Willkommen

Der Symbol- und Linientyp-Editor ist Bestandteil des Trimble Geomatics Office-Systems, um es Ihnen zu ermöglichen, die von dem System verwendeten Symbol- und Linientyp-Bibliotheken zu bearbeiten. Der Editor benutzt dasselbe Programm, um die Symbol- und Linientyp-Definitionen zu bearbeiten, mit leichten Schnittstellenunterschieden, abhängig von dem Modus, in dem sich der Editor befindet.

Der Symbol- und Linientyp-Editor ist eine eigenständige Anwendung. Um diese Anwendung unabhängig vom Trimble Geomatics Office-System auszuführen, wählen Sie die Verknüpfungssymbole für den Symbol-Editor oder Linientyp-Editor vom Trimble Geomatics Office-Ordner.

Wenn das Trimble Geomatics Office-System ausgeführt wird, und kein Projekt geöffnet ist, erscheinen die Optionen Symbol-Editor und Linientyp-Editor unter dem Menü “Dienstprogramme”. Wenn der Editor von diesem Menü gewählt wird, öffnet er automatisch die momentane, vom Trimble Survey Offce-System verwendete Symbol- oder Linientyp-Bibliothek. Eine Bildschirmliste zeigt die Namen der Symbole oder Linientypen in der geöffneten Bibliothek an. Verwenden Sie diese Liste, um das Symbol oder den Linientyp auszuwählen, die Sie bearbeiten möchten.

HINWEIS: Wenn Sie den Symbol- oder Linientyp-Editor unabhängig vom Trimble Geomatics Office-System ausführen, während ein Projekt geöffnet ist, werden jegliche Änderungen, die Sie in den System-Bibliotheken durchführen, solange nicht im momentanen Projekt erscheinen, bis Sie das Projekt schließen und daraufhin erneut öffnen.


Allgemeine Handhabung

Der Hauptbestandteil des Symbol- und Linientyp-Editors ist ein aktives Gitternetz, auf dem Sie Symbole und Linientypen entwerfen und bearbeiten.

Wenn Sie sich im Modus Symbol-Editor befinden, stellt sich ein Symbol-Einfügungspunkt auf dem Bearbeitungsgitter dar. Dies ist nicht der Fall, wenn der Modus Linientyp-Editor vorliegt, aber dieser Modus stellt zwei dreieckige Symbole an den mittleren Punkten des Bearbeitungsgitters dar. Diese Symbole weisen auf die Einfügungsangleichung des Linientypmusters (von links nach rechts) hin, wenn sie in einer Linienstil-Definition im Trimble Geomatics Office-System verwendet werden. Wenn Sie Linientyp-Definitionen bearbeiten, definieren Sie ein Einzelmuster, das entlang einer Linie zwischen Anfangs- und Endpunkten wiederholt werden soll, entsprechend der in der Linienstil-Definition im Trimble Geomatics Office-System definierten Musterlänge. Das vertikale Gitterausmaß ist der Breite des Linientypmusters gleich, und das horizontale Gitterausmaß ist der Musterlänge gleich.

Eine Statusleiste erscheint unterhalb des Bearbeitungsgitters. Sie zeigt Information über die Handhabung des Editors an. Auf der rechten Seite der Statusleiste werden die Koordinaten des Mauszeigers angezeigt, wenn Sie auf dem Gitter arbeiten.


Standard-Bibliotheken

Die Trimble Geomatics Office Software wird zusammen mit Standard-Bibliotheken von Symbolen und Linientypen geliefert. Sie können bei Bedarf Symbole oder Linientypen zu diesen Bibliotheken hinzufügen, jegliche in diesen Bibliotheken enthaltenen Symbole oder Linientypen erneut definieren oder neue Bibliotheken erstellen. Symbol-Bibliotheken weisen eine .SYM-Dateierweiterung auf. Die Software speichert die voreingestellte Symbol-Bibliothek mit Namen SYMBOLS.SYM im SYSTEM-Verzeichnis unter dem Programmverzeichnis. Linientyp-Bibliotheken haben eine .LTP-Dateierweiterung. Das System speichert die voreingestellte Linientyp-Bibliothek mit Namen LINETYPE.LTP im SYSTEM-Verzeichnis unter dem Programmverzeichnis. Gemäß Voreinstellung speichert das System jede neue Bibliothek mit der zutreffenden Erweiterung.

HINWEIS: Das Trimble Geomatics Office-System kann zur gleichen Zeit nur mit einer Symbol- und einer Linientyp-Bibliothek arbeiten, und betrachtet diese Bibliotheken als die System-Bibliotheken. Um eine andere Symbol- oder Linientyp-Bibliothek als die anfangs voreingestellten Bibliotheken zu verwenden, ist es nötig, die System-Registrierungseinstellungen zu ändern, die die Bibliothek-Dateinamen speichern.


Technische Details

Die Symbole und Linientypen sind auf einer Matrix definiert, die aus 200 x 200 Gitternetzschritten mit tatsächlichen Gitterpunkten, die alle zehn Schritte angezeigt werden, besteht. Aktivieren Sie die Option An Gitter anpassen , und alle hinzugefügten Linien werden sich an die angezeigten Gitterpunkte anpassen. Jegliche Kombination von Linien und Bogen zwischen Punkten auf der Matrix definiert Symbole und Linientypen. Die Angabe der Größendefinition für Symbole kann durch das Symbol Größenradius kontrolliert werden, das für individuelle Symbole angepaßt werden kann. Für Linientypen wird die gesamte vertikale Ausdehnung (wie auf dem Gitter zu sehen) der Elemente in jedem Linientypmuster zusammen mit jedem Linientyp aufgezeichnet. Wenn die Linientypbreite in einem Linien-Stil im System bestimmt ist, wird diese Breite auf die tatsächliche Breite des Linientyps und nicht auf die totale Gittergröße angewendet. Dies bedeutet, daß die Linie, wenn Sie einen Linientyp definieren, der nur die Hälfte der auf dem Bearbeitungsgitter verfügbaren Breite verwendet, und dann angeben, daß die Linientypbreite 3 mm in Papiereinheiten in der Linienstil-Definition betragen soll, 3 mm breit geplottet wird, obwohl sich die Definition nicht über das gesamte Gitter erstreckt.

Die maximale Anzahl von Vektoren in einem Symbol oder Linientyp liegt bei 250. Sie können bis zu 500 Symbole oder Linientypen in einer einzigen Bibliothek unterbringen.


Garantie

Garantieausschluß

Außer in den im folgenden dargelegten “Garantieeinschränkungen” wird Trimble Hardware, Software, Firmware und die Dokumentation “wie gesehen” angeboten, ohne ausdrückliche oder eingeschränkte Garantie jeglicher Art sowohl von seiten der Trimble Navigation Limited als auch von jeglichen Personen, die an der Erzeugung, Herstellung oder dem Vertrieb beteiligt waren, einschließlich aber nicht begrenzt auf, die angenommenen Garantien auf Verwertbarkeit und Verwendbarkeit für eine bestimmte Anwendung. Das gesamte Risiko für Qualität und Leistungsfähigkeit der Trimble Hardware, Software, Firmware und Dokumentation wird vom Endkunden getragen. In einigen Staaten ist der Ausschluß von angenommenen Garantien nicht erlaubt, daher trifft obiger Ausschluß möglicherweise für Sie nicht zu.

Haftungsausschluß

Da die Software ausgesprochen umfangreich und daher möglicherweise nicht fehlerfrei ist, wird empfohlen, durchgeführte Arbeiten zu überprüfen. Unter keinen Umständen ist Trimble Navigation Limited oder eine Personen die an der Erzeugung, Herstellung oder dem Vertrieb der Trimble Software beteiligt waren, Ihnen gegenüber für jegliche Art von Schadensersatz-ansprüchen haftbar, einschließlich Gewinnverlust oder andere spezieller, zufälliger, folgender oder über den verursachten Schaden hinausgehenden Schäden, einschließlich aber nicht begrenzt auf jegliche Art von Schäden die gegen Sie entstehen oder für die Sie an Dritte bezahlt haben, hervorgerufen aus der Verwendung entstehenden Haftung, Qualität oder Leistungsfähigkeit solcher Trimble-Software und Dokumentation, auch dann, wenn Trimble Navigation Limited oder einer solchen Person oder Stelle die Möglichkeit solcher Schäden bekannt gemacht wurde, oder für jeden Anspruch Dritter. Einige Staaten erlauben den Haftungsausschluß für zufällige oder Folgeschäden nicht, diese obigen Ausschlüsse treffen deshalb möglicherweise für Sie nicht zu.

Garantieeinschränkungen für Software und Firmware

Trimble Navigation Limited garantiert, daß Software- und Firmware-Produkte die veröffentlichten Spezifikationen im wesentlichen erfüllen, vorausgesetzt sie werden mit den Trimble-Produkten, Computerprodukten und Betriebssystemen betrieben, für die sie entwickelt wurden. Für die Dauer von neunzig (90) Tagen, beginnend dreißig (30) Tagen nach Versand durch Trimble, garantiert Trimble auch, daß der magnetische Datenträger, auf dem die Software oder Firmware vertrieben wurde, und die Dokumentation frei von Fehlern in Material und Verarbeitung sind. Während dieser Garantiezeit von neunzig (90) Tagen ersetzt Trimble fehlerhafte Datenträger oder Dokumentationen, oder behebt wesentliche Programmfehler kostenlos. Sollte Trimble den fehlerhafte Datenträger oder die Dokumentation nicht ersetzen oder den Programmfehler nicht beheben können, ersetzt Trimble den für die Software bezahlten Preis. Dies ist Ihr einziger Rechtsanspruch für jeglichen Bruch der Garantie.

Hardware Limited Warranty

Trimble Navigation Limited gewährt eine Garantie von einem Jahr gegen Fehler in Material und Verarbeitung. Die Garantiedauer beginnt dreißig (30) Tage nach dem Versand von Trimble. Garantieservice ist erhältlich von einem Trimble Servicezentrum. Trimble behält sich vor, als fehlerhaft erwiesene Produkte entweder zu reparieren oder ersetzen. Der Kunde übernimmt alle Kosten für die Einsendung von Produkten an Trimble für Garantieservice, einschließlich Steuern und Abgaben, die durch das Einsenden von Produkten von außerhalb der Vereinigten Staaten von Amerika entstehen. Trimble übernimmt alle Kosten für die Rücksendung von Produkten an den Kunden.

Die obige Garantie gilt nicht für Fehler hervorgerufen durch:

1.	Unsachgemäße Wartung durch den Käufer

2.	Software oder Schnittstellen des Käufers

3.	Mißbrauch oder artfremde Nutzung

4.	Nutzung außerhalb der vorgegebenen Bedingungen

5.	Unsachgemäße Installation

6.	Blitzschlag oder elektrische Entladung

7.	Schäden durch Süß- oder Salzwasser sowie Spritzwasser

8.	Normale Abnutzung von Verbrauchsmaterialien (z. B. Batterien)

Keinerlei andere Garantie besteht. Trimble Navigation Limited schließt insbesondere angenommene Garantien für jegliche bestimmte Anwendbarkeit und Verwertbarkeit aus.


Hilfe während der Arbeit bekommen

Um Hilfe bei einem Dialogfeld zu bekommen, stellen Sie sicher, daß das gewünschte Dialogfeld aktiv ist, und drücken Sie daraufhin F1.

Um Hilfe bei einer Menüoption zu bekommen, plazieren Sie Ihre Maus über der Menüoption und drücken dann F1.


Bearbeiten | Ausschneiden

Verknüpfungen

Tasten	Strg + X

Verwenden Sie die Option Ausschneiden, um ausgewählte Elemente von einem Symbol oder Linientyp zu entfernen und in der Zwischenablage zu speichern.

Verwenden Sie die Optionen Bearbeiten | Wählen oder Bearbeiten | Alle wählen , um individuelle Elemente oder alle Elemente für die Option Ausschneiden zu wählen. Die in die Zwischenablage verlegten Elemente sind fürs Einfügen in ein anderes Symbol oder Linientyp verfügbar.


Bearbeiten | Rückgängig

Verknüpfung

Tasten	Strg + Z
Schaltfläche der Symbolleiste

Verwenden Sie die Option Rückgängig, um den zuletzt mit dem momentanen Symbol oder Linientyp ausgeführten Vorgang umzukehren oder “zurückzurollen”.

HINWEIS: Es besteht nur die Möglichkeit, diejenigen Vorgänge rückgängig zu machen, die sich auf das momentan gewählte Symbol oder den momentan gewählten Linientyp beziehen. Sobald Sie ein anderes Symbol oder einen anderen Linientyp gewählt haben, wird der “Rückgängig-Stapel” neu angefangen und ermöglicht es Ihnen dann, nur die mit dem neuen Symbol oder Linientyp zusammenhängenden Vorgänge rückgängig zu machen.


Bearbeiten | Kopieren

Verknüpfung

Tasten	Strg+C

Verwenden Sie die Option Kopieren, um von einem Symbol oder Linientyp ausgewählte Elemente zu kopieren und in der Zwischenablage zu speichern.

Verwenden Sie die Optionen Bearbeiten | Wählen oder Bearbeiten | Alle wählen, um individuelle Elemente oder sämtliche Elemente mit Bezug auf die Option Ausschneiden zu wählen. Diese Option ist von Nutzen, wenn Sie ein neues Symbol oder neuen Linientyp erzeugen möchten, die auf dem ganzen oder einem Teil des bestehenden Symbols oder Linientyps basieren—Sie können die Option Bearbeiten | Einfügen verwenden, um die Elemente in das neue Symbol oder den neuen Linientyp einzufügen.


Bearbeiten | Einfügen

Verknüpfung

Tasten	Strg+V

Verwenden Sie die Option Einfügen, um Elemente, die zuvor in der Zwischenablage gespeichert wurden, unter Verwendung der Optionen Bearbeiten | Ausschneiden oder Bearbeiten | Kopieren in das momentane Symbol oder den momentanen Linientyp einzufügen. Die eingefügten Elemente werden daraufhin im momentanen Symbol oder Linientyp zusätzlich zu jeglichen bereits vorhandenen Elementen aufgenommen.

HINWEIS: Die eingefügten Elemente ersetzen jegliche gewählten Elemente im momentanen Symbol oder Linientyp.


Bearbeiten | Löschen

Verknüpfung

Taste	Del

Verwenden Sie die Option Löschen, um gewählte Elemente von dem Symbol oder Linientyp zu entfernen. Diese Option speichert die gelöschten Elemente nicht in der Zwischenablage.


Bearbeiten | An Raster anpassen
Bearbeiten | An Gitternetz anpassen

Verknüpfung

Taste	F3

Aktivieren Sie An Gitternetz anpassen, und die Vektoren passen sich an den nächstgelegenen Punkt an, der in der Symbol-Matrix dargestellt ist.

Deaktivieren Sie An Gitternetz anpassen, und die Vektoren passen sich an ein feines, nicht dargestelltes Gitternetz an, das auf 10% des Zwischenraums zwischen Punkten beruht.


Bearbeiten | Wählen

Verknüpfung

Taste	F2
Schaltfläche der Symbolleiste

Verwenden Sie die Option Wählen oder klicken Sie auf die Schaltfläche Wählen von der Symbolleiste, um auf Auswahl-Modus umzuschalten (durch das Pfeilsymbol der Maus verdeutlicht). Die Option Menü erscheint aktiviert, wenn in Auswahl-Modus.

Auswahl-Modus ermöglicht es Ihnen, Elemente in dem momentanen Symbol oder Linientyp für Bearbeitungszwecke und zur Verwendung in den Optionen Ausschneiden, Kopieren und Löschen durch Klicken der Maustaste auszuwählen, wenn ein Element nahe ist.

Sie können mehrere Elemente auswählen, indem Sie die Umschalttaste gedrückt halten, wenn Sie, nachdem die erste Auswahl durchgeführt ist, auf Elemente klicken. Wenn Sie die Umschalttaste gedrückt halten und auf ein bereits ausgewähltes Element klicken, wird die Auswahl rückgängig gemacht. Wenn Sie die Maus im Leerraum klicken (d.h. nicht in der Nähe eines Elements oder Linientyps) während Sie sich im Auswahl-Modus befinden und dabei nicht die Umschalttaste gedrückt haben, wird die Auswahl jeglicher Elemente rückgängig gemacht.

Ein Element bearbeiten

Wenn Sie ein einzelnes Element auswählen, wird das Element gestrichelt und mit “Bearbeitungsgriffen” dargestellt. Im Falle einer gewählten Linie wird ein Bearbeitungsgriff an beiden Enden der Linie dargestellt, und bei einem gewählten Bogen erscheint ein Bearbeitungsgriff an beiden Enden des Bogens sowie in der Mitte des Bogens.

Wenn Sie den Auswahl-Mauszeiger über einem Bearbeitungsgriff plazieren, wird ein Vierwege-Pfeilsymbol zu dem Standardzeiger hinzugefügt. Dies bedeutet, daß Sie den Bearbeitungsgriff mit Hilfe der Maus bewegen können, indem Sie die Maustaste gedrückt halten und den Bearbeitungsgriff zur benötigten neuen Position ziehen. Die Bearbeitungsgriffe an den Enden einer Linie oder eines Bogens ermöglichen die Modifikation bzgl. der Länge und Orientierung der Linie oder des Bogens. Der Bearbeitungsgriff in der Mitte eines Bogens erlaubt es Ihnen, die Krümmung des Bogens zu ändern, während die Endpunkte ihre Positionen beibehalten.

Ein Element bewegen

Dasselbe Bearbeitungssymbol erscheint, wenn Sie den Mauszeiger irgendwo entlang einer gewählten Linie oder eines gewählten Bogens plazieren. Dies bedeutet, daß Sie, indem Sie die Maustaste gedrückt halten, das gewählte Element oder die gewählten Elemente zu einem anderen Bereich im Gitternetz ziehen können. Während Sie das Element oder die Elemente entlangziehen, weisen diese durchgehende rote Linien auf. Wenn die Maustaste losgelassen wird, plaziert sich das Element oder die Elemente in seiner/ihren neuen Position(en) und sie erscheinen als gewählte Elemente.

Die Farbe eines Elements ändern

Wenn Sie ein oder mehrere Elemente ausgewählt haben, und wenn die Option Farben verwenden für das Symbol oder den Linientyp eingestellt ist, können Sie die Farbeinstellungspalette auf der Symbolleiste verwenden, um den Elementen eine neue Farbe zuzuteilen.

Den Symbol-Einfügungspunkt wählen

Wenn ein Symbol bearbeitet wird, wird der Einfügungspunkt mit Hilfe eines speziellen Kästchensymbols, das ein diagonales Kreuz vorweist, angezeigt. Dies weist auf die Koordinatenposition innerhalb des Symbols hin, das sich auf der Punktposition in der Datenbank befindet.

Ein Bearbeitungsgriff erscheint beim Einfügungspunkt des Symbols, wenn Sie auf das Symbol in Auswahl-Modus klicken. Das Symbol erscheint gestrichelt. Sie können den Einfügungspunkt wie benötigt zu einem neuen Platz ziehen. Wenn Sie den Einfügungspunkt zusammen mit anderen Elementen auswählen, kann der Einfügungspunkt zusammen mit ihnen verschoben werden.

Wenn Sie den Einfügungspunkt wählen, und Größenradius dargestellt ist, ist es möglich, den Größenradius zu ziehen und auf einen neuen Wert einzustellen. Dies ermöglicht es Ihnen, zu steuern, wie die Größeneinstellung von Symbolen im Trimble Geomatics Office-System gehandhabt wird.


Bearbeiten | Alle wählen

Verwenden Sie die Option Alle wählen, um alle Elemente in dem momentanen Symbol oder dem momentanen Linientyp zu wählen. Wenn alle Elemente gewählt sind, bleibt das Programm im Auswahl-Modus.


Menü "Bearbeitung"

Die folgenden Optionen stehen zur Verfügung:

Rückgängig

Ausschneiden

Kopieren

Einfügen

Löschen

Anpassen

Wählen

Alle wählen


Zeichnen | Linie

Verknüpfung

Schaltfläche der Symbolleiste

Verwenden Sie die Option Linie oder klicken Sie auf die Schaltfläche Linie der Symbolleiste, um auf den Modus Linie zeichnen umzuschalten.

Wenn man sich im Modus Linie zeichnen befindet, wird der Mauszeiger zu einem Fadenkreuz-Symbol. Das Klicken der Maustaste wählt die momentane Position auf dem Gitternetz als den Start- oder Endpunkt für die hinzuzufügende Linie aus. Definieren Sie den ersten Linienpunkt, und eine rote “Gummiband-”Linie, die dem Mauszeiger folgt, erscheint, wo die nächste Linie hinzugefügt werden wird. Ein weiteres Klicken der Maustaste resultiert im Speichern dieser Linie unter Verwendung der momentan gewählten Farbe (überprüfen Sie Farben verwenden für den Symbol- oder Linientyp), und eine rote “Gummiband-”Linie beginnt von diesem letzten Punkt. Das Klicken der rechten Maustaste startet eine neue Liniensequenz, ohne daß eine Linie mit dem letzten Punkt verbunden wird. Die erneute Wahl dieser Option oder der Schaltfläche Linie von der Symbolleiste startet ebenso eine neue Liniensequenz.

HINWEIS: Die Wahl der Option Zeichnen | Bogen oder der Schaltfläche Bogen von der Symbolleiste bewirkt das Umschalten zum Modus Bogen Zeichnen, wobei der momentane Linienstartpunkt als Startpunkt für den neuen Bogen beibehalten wird.

TIP: Wenn Sie eine neue Linie hinzufügen, können Sie den Mauszeiger bei Bedarf mit den Pfeiltasten der Tastatur “fahren”. Dies kann in einigen Fällen schneller und einfacher sein als die Maus selbst zu bewegen. Um eine Position auszuwählen, drücken Sie die Leertaste.


Zeichnen | Bogen

Verknüpfung

Schaltfläche der Symbolleiste

Verwenden Sie die Option Bogen oder klicken Sie auf die Schaltfläche Bogen der Symbolleiste, um auf den Modus Bogen zeichnen umzuschalten.

Wenn man sich im Modus Bogen zeichnen befindet, wird der Mauszeiger zu einem Fadenkreuz-Symbol. Das Klicken der Maustaste wählt die momentane Position auf dem Gitternetz als den Start- oder Endpunkt für den hinzuzufügenden Bogen aus. Definieren Sie den ersten Bogenpunkt, und eine rote “Gummiband-”Linie, die dem Mauszeiger folgt, zeigt die Sehne zum Bogenendpunkt an. Ein weiteres Klicken der Maustaste resultiert im Speichern dieser Position als Bogenendpunkt, und die “Gummiband-”Linie wird zu einem “Gummibogen”, der anzeigt, wo sich der neue Bogen befindet. Weiteres Klicken der Maustaste resultiert im Speichern dieses so definierten Bogens unter Verwendung der momentan gewählten Farbe (überprüfen Sie Farben verwenden für den Symbol- oder Linientyp). Ein neues Gummiband beginnt von dem Bogenendpunkt, um bei der Plazierung des nächsten Bogenendpunktes zu assistieren. Das Klicken der rechten Maustaste startet eine neue Bogensequenz, ohne daß ein Bogen mit dem letzten Punkt verbunden wird. Die erneute Wahl dieser Option oder der Schaltfläche Bogen von der Symbolleiste startet ebenso eine neue Bogensequenz.

HINWEIS: Die Wahl der Option Zeichnen | Linie oder der Schaltfläche Linie von der Symbolleiste vor der Bestimmung des Endpunktes für einen Bogen bewirkt das Umschalten auf den Modus Linie zeichnen, wobei der momentane Bogenstartpunkt als Startpunkt für die neue Linie beibehalten wird. Wenn Sie dabei sind, den Punkt auf dem Bogen zu wählen, dann resultiert das Umschalten auf den Modus Linie zeichnen darin, daß die spezifischen Start- und Endpunkte des Bogens ignoriert werden.

TIPS:

1. Sie können einen Kreis als Teil einer Symbol- oder Linientyp-Definition erzeugen, indem Sie dieselbe Position für die Start- und Endpunkte wählen und daraufhin den Punkt auf dem Bogen/Kreis zur entsprechenden Position ziehen.

2. Wenn Sie einen Bogen hinzufügen, können Sie den Mauszeiger bei Bedarf mit den Pfeiltasten der Tastatur “fahren”. Dies kann in einigen Fällen schneller und einfacher sein als die Maus selbst zu bewegen. Um eine Position auszuwählen, drücken Sie die Leertaste.


Zeichnen | Aktualisieren

Verknüpfung

Taste	F5

Verwenden Sie die Option Aktualisieren, um das Symbol oder den Linientyp auf dem Bildschirm erneut zu zeichnen.

Gelegentlich kann es vorkommen, daß der Bearbeitungsabschluß eines Symbols oder Linientyps einen Teil der Linien in Verwirrung bringen kann. Aktualisieren Sie den Bildschirm, um die Linien wiederherzustellen.


Menü "Zeichnen"

Die folgenden Optionen stehen zur Verfügung:

Linie

Bogen

Aktualisieren


Symbol | Hinzufügen

Verwenden Sie die Option Hinzufügen, um ein neues Symbol zur Bibliothek hinzuzufügen.

Wählen Sie diese Option, und das Dialogfeld Neues Symbol hinzufügen erscheint und ermöglicht es Ihnen, den Namen für das neue Symbol anzugeben und zu bestimmen, ob in der Definition Farben verwendet werden sollen.


Symbol | Löschen

Verwenden Sie die Option Löschen, um das momentan gewählte Symbol aus der Bibliothek zu entfernen.

Sie haben die Möglichkeit, das Löschen des Symbols zu bestätigen—es ist nicht möglich, diesen Löschvorgang rückgängig zu machen.


Symbol | Einstellungen

Verwenden Sie die Option Einstellungen, um das momentane Symbol umzubenennen und um anzugeben, ob die Definition Farben verwenden soll oder nicht.

Wählen Sie diese Option, und das Dialogfeld Symbol-Einstellungen erscheint.


Symbol | Größenradius anzeigen

Verwenden Sie die Option Größenradius anzeigen, um auszuwählen, ob der Größenradius für Symbole angezeigt werden soll oder nicht.

Der Größenradius stellt sich auf dem Bildschirm als ein Strichpunkt-umrandeter blauer Kreis dar.

Diese Option erscheint aktiviert, wenn der Größenradius angezeigt wird. Der Größenradius hat seinen Mittelpunkt auf dem Symbol-Einfügungspunkt und weist auf den Anteil des Symbols hin, das in der Definition der Symbolgröße verwendet werden soll, wie in der Punktstil-Definition im Trimble Geomatics Office System spezifiziert.

Sie können den Größenradius ändern, indem Sie, nachdem Sie den Symbol-Einfügungspunkt gewählt haben, den dargestellten Kreis ziehen. Wenn der Größenradius für ein Symbol zum Beispiel auf die Hälfte des gesamten Ausmaßes der Symbollinien eingestellt ist, dann wird das Symbol, wenn der Punktstil festlegt, daß das Symbol in einer Größe von 5 m (Bodeneinheiten) geplottet wird, tatsächlich in 10 m Größe geplottet. Dies geschieht, da der Größenradius darauf hinweist, daß die definierte Größe nur auf den Teil des Symbols, der durch den Größenradius spezifiziert ist, angewendet werden kann (effektiv der Anteil des Symbols, der innerhalb des Größenradiuskreises eingeschlossen ist). Diese Einrichtung ist dann von Nutzen, wenn Sie einen bestimmten Anteil eines Symbols haben, auf den die Symbolgröße angewendet werden soll.


Menü "Symbol"

Die folgenden Optionen stehen zur Verfügung:

Hinzufügen

Löschen

Einstellungen

Größenradius anzeigen


Linientyp | Hinzufügen

Verwenden Sie die Option Hinzufügen, um einen neuen Linientyp zur Bibliothek hinzuzufügen.

Wählen Sie diese Option und das Dialogfeld Neuen Linientyp hinzufügen erscheint, so daß Sie folgendes angeben können:

•	den Namen für den neuen Linientyp,

•	ob Farben in der Definition verwendet werden können oder nicht, und

•	ob er als ein Einzelmuster-Linientyp behandelt werden soll.


Linientyp | Löschen

Verwenden Sie die Option Löschen, um den momentan gewählten Linientyp aus der Bibliothek zu entfernen.

Sie haben die Möglichkeit, das Löschen des Linientyps zu bestätigen—es ist nicht möglich, diesen Löschvorgang rückgängig zu machen.


Linientyp | Einstellungen

Verwenden Sie die Option Einstellungen, um:

•	den momentanen Linientyp umzubenennen, und

•	anzugeben, ob Farben in der Definition verwendet werden können oder nicht, und

•	ob er als ein Einzelmuster-Linientyp behandelt werden soll.

Wenn diese Option gewählt wird, erscheint das Dialogfeld Linientyp-Einstellungen.


Menü "Linientyp"

Die folgenden Optionen stehen zur Verfügung:

Hinzufügen

Löschen

Einstellungen


Hilfe | Hilfe-Themen

Wählen Sie Hilfe | Hilfe-Themen, um das Dialogfeld Hilfe-Themen anzuzeigen.

Um ein Thema in Hilfe zu finden:

•	Klicken Sie auf das Register Inhalt, um die Themen nach Kategorie zu durchsuchen.

•	Klicken Sie auf das Register Index, um eine Liste von Indexeinträgen anzusehen, und geben Sie entweder das Wort ein, nach dem Sie suchen, oder verwenden Sie den Bildlauf, um die Liste durchzusehen.

•	Klicken Sie auf das Register Suchen, um nach Wörtern oder Ausdrücken zu suchen, die in einem Hilfe-Thema enthalten sein könnten.


Hilfe | Info

Diese Option zeigt ein Info-Feld an, das die Copyright- und Versionsinformation für dieses Programm enthält.


Menü "Hilfe"

Die folgenden Optionen stehen zur Verfügung:

Hilfe-Themen

Info


Menü "Datei"

Das Menü “Datei” enthält Optionen für die Handhabung des Öffnens und Speicherns von Symbol- und Linientyp-Bibliotheken.

Es beinhaltet zudem die Option Beenden. Verwenden Sie die Option Beenden, um das Programm zu schließen.


Menü "Bearbeiten"

Das Menü “Bearbeiten” enthält die Standardoptionen Ausschneiden, Kopieren, Einfügen und Löschen, die zur Änderung der Symbol- und Linientyp-Definitionen eingesetzt werden.

Es beinhaltet ebenso die Option Rückgängig, die es erlaubt, Bearbeitungsvorgänge rückgängig zu machen, die Option An Gitternetz anpassen, die Kontrolle über die Cursor-Positionierung bietet, und die Optionen Wählen, die die Auswahl von Symbol- oder Linientyp-Elementen für Bearbeitungszwecke ermöglichen.


Menü "Zeichnen"

Das Menü “Zeichnen” ermöglicht das Zeichnen von Linien und Bogen, und es bietet die Option Aktualisieren, um das Symbol oder den Linientyp erneut auf dem Bildschirm zu zeichnen.


Menü "Symbol"

Das Menü “Symbol” enthält die Optionen Hinzufügen und Löschen, die es ermöglichen, Symbole zur momentanen Bibliothek hinzuzufügen oder aus ihr zu entfernen. Die Option Einstellungen erlaubt es Ihnen, Einstellungen für das momentane Symbol zu ändern. Die Option Größenradius anzeigen bietet Kontrolle darüber, ob der Größenradius des Symbols auf dem Bildschirm dargestellt werden soll oder nicht.


Menü "Linientyp"

Das Menü Linientyp enthält die Optionen Hinzufügen und Löschen, die es ermöglichen, Linientypen zur momentanen Bibliothek hinzuzufügen oder aus ihr zu entfernen. Die Option Einstellungen erlaubt es Ihnen, Einstellungen für den momentanen Linientyp zu ändern.


Menü "Hilfe"

Das Menü “Hilfe” bietet direkten Zugriff auf diese Hilfe-Datei für den Symbol- und Linientyp-Editor. Es stellt zudem das Dialogfeld Info dar, die einige Einzelheiten über das Programm enthält.


Menü "Überblick

Die folgenden Menüs stehen zur Verfügung:

Menü	Beschreibung
Menü "Datei"	Das Menü “Datei” enthält Optionen für die Handhabung des Öffnens und Speicherns von Symbol- und Linientyp-Bibliotheken. Es beinhaltet zudem die Option Beenden. Verwenden Sie die Option Beenden, um das Programm zu schließen.
Menü "Bearbeitung"	Das Menü “Bearbeiten” enthält die Standardoptionen Ausschneiden, Kopieren, Einfügen und Löschen, die zur Änderung der Symbol- und Linientyp-Definitionen eingesetzt werden. Es beinhaltet ebenso die Option Rückgängig, die es erlaubt, Bearbeitungsvorgänge rückgängig zu machen, die Option An Gitternetz anpassen, die Kontrolle über die Cursor-Positionierung bietet, und die Optionen Wählen, die die Auswahl von Symbol- oder Linientyp-Elementen für Bearbeitungszwecke ermöglichen.
Menü "Zeichnen"	Das Menü “Zeichnen” ermöglicht das Zeichnen von Linien und Bogen, und es bietet die Option Aktualisieren, um das Symbol oder den Linientyp erneut auf dem Bildschirm zu zeichnen.
Menü "Symbol"	Das Menü “Symbol” enthält die Optionen Hinzufügen und Löschen, die es ermöglichen, Symbole zur momentanen Bibliothek hinzuzufügen oder aus ihr zu entfernen. Die Option Einstellungen erlaubt es Ihnen, Einstellungen für das momentane Symbol zu ändern. Die Option Größenradius anzeigen bietet Kontrolle darüber, ob der Größenradius des Symbols auf dem Bildschirm dargestellt werden soll oder nicht.
Menü "Linientyp"	Das Menü Linientyp enthält die Optionen Hinzufügen und Löschen, die es ermöglichen, Linientypen zur momentanen Bibliothek hinzuzufügen oder aus ihr zu entfernen. Die Option Einstellungen erlaubt es Ihnen, Einstellungen für den momentanen Linientyp zu ändern.


Neuen Linientyp hinzufügen

Das Dialogfenster Neuen Linientyp hinzufügen erscheint, wenn Sie die Option Linientyp | hinzufügen wählen, um einen neuen Linientyp zur momentanen Linientyp-Bibliothek hinzuzufügen.

Linientypname

Dieses Feld ermöglicht es Ihnen, dem von Ihnen erzeugten neuen Linientyp einen geeigneten Namen zuzuordnen. Alle Linientypen in einer Bibliothek müssen über eindeutige Namen verfügen. Das System führt eine Überprüfung durch, um sicherzustellen, daß Sie eindeutige Namen zugeteilt haben, wenn Sie OK wählen. Falls der spezifizierte Name bereits in der Bibliothek verwendet wird, warnt Sie das System und gibt Ihnen die Möglichkeit, einen anderen Namen anzugeben.

Farbverwendung

Dieses Kontrollkästchen ermöglicht es Ihnen, zu spezifizieren, ob der Linientyp, wenn dieser vom Trimble Geomatics Office-System verwendet wird, die Bildschirmfarben festlegen wird oder nicht.

Aktivieren Sie diese Option, und die Farbpalette in der Symbolleiste wird verfügbar, und bei Bedarf kann der Linientyp unter Verwendung von mehreren Farben erzeugt werden. Mit dieser Option aktiviert steht einem Linientyp, der einem Linienstil in dem Trimble Geomatics Office-System zugeordnet ist, das Feld Farbauswahl in der Stil-Definition nicht zur Verfügung. Es ist auf “Vom Linientyp” eingestellt, um anzuzeigen, daß die in dem Linientyp festgelegten Farben immer verwendet werden, wenn das Trimble Geomatics Office-System den Linientyp darstellt oder plottet.

Einzelmuster

Dieses Kontrollkästchen gestattet es Ihnen, zu bestimmen, ob dieser Linientyp nur unter Verwendung eines Einzelmusters, das sich zwischen den Anfangs- und Endpunkten für die Linie erstreckt, dargestellt und geplottet werden soll.

Wenn diese Option aktiviert ist und ein Linientyp einem Linienstil im Trimble Geomatics Office-System zugeteilt ist, ist das Feld Länge in der Stil-Definition nicht verfügbar. Es ist auf “Automatisch” eingestellt, um anzuzeigen, daß das System die Musterlänge für den Linientyp entsprechend der Distanz zwischen den Anfangs- und Endpunkten für die Linie ausarbeitet. Sie können jedoch immer noch das Feld Musterbreite in der Stil-Definition einstellen. Verwenden Sie einen Einzelmuster-Linientyp für die Darstellung von Objekten wie z.B. Toren, wo das zutreffende Linientypmuster gedehnt werden muß, um zwischen die die Ausmaße des Gatters definierenden Punkte zu passen.


Linientyp-Einstellungen

Das Dialogfeld Linientyp-Einstellungen erscheint, wenn Sie die Option Linientyp | Einstellungen wählen, um die Einstellungen für den momentan gewählten Linientyp zu ändern.

Linientypname

Dieses Feld ermöglicht es Ihnen, den momentan gewählten Linientyp umzubenennen. Alle Linientypen in einer Bibliothek müssen über eindeutige Namen verfügen. Das System führt eine Überprüfung durch, um dies sicherzustellen, wenn Sie OK wählen. Falls der spezifizierte Name bereits in der Bibliothek verwendet wird, warnt Sie das System  und gibt Ihnen die Möglichkeit, einen anderen Namen anzugeben.

Farbverwendung

Dieses Kontrollkästchen ermöglicht es Ihnen, zu spezifizieren, ob der Linientyp, wenn dieser vom Trimble Geomatics Office-System verwendet wird, die Bildschirmfarben festlegen wird oder nicht.

Aktivieren Sie diese Option, und die Farbpalette in der Symbolleiste wird verfügbar, und bei Bedarf kann der Linientyp unter Verwendung von mehreren Farben erzeugt werden. Mit dieser Option aktiviert steht einem Linientyp, der einem Linienstil in dem Trimble Geomatics Office-System zugeordnet ist, das Feld Farbauswahl in der Stil-Definition nicht zur Verfügung. Es ist auf “Vom Linientyp” eingestellt, um anzuzeigen, daß die in dem Linientyp festgelegten Farben immer verwendet werden, wenn das Trimble Geomatics Office-System den Linientyp darstellt oder plottet.

Einzelmuster

Dieses Kontrollkästchen gestattet es Ihnen, zu bestimmen, ob dieser Linientyp nur unter Verwendung eines Einzelmusters, das sich zwischen den Anfangs- und Endpunkten für die Linie erstreckt, dargestellt und geplottet werden soll.

Wenn diese Option aktiviert ist und ein Linientyp einem Linienstil im Trimble Geomatics Office-System zugeteilt ist, ist das Feld Länge in der Stil-Definition nicht verfügbar. Es ist auf “Automatisch” eingestellt, um anzuzeigen, daß das System die Musterlänge für den Linientyp entsprechend der Distanz zwischen den Anfangs- und Endpunkten für die Linie ausarbeitet. Sie können jedoch immer noch das Feld Musterbreite in der Stil-Definition einstellen. Verwenden Sie einen Einzelmuster-Linientyp für die Darstellung von Objekten wie z.B. Toren, wo das zutreffende Linientypmuster gedehnt werden muß, um zwischen die die Ausmaße des Gatters definierenden Punkte zu passen.


Neues Symbol hinzufügen

Das Dialogfeld Neues Symbol hinzufügen erscheint, wenn Sie die Option Symbol | Hinzufügen wählen, um ein neues Symbol zur momentanen Symbol-Bibliothek hinzuzufügen.

Symbolname

Dieses Feld ermöglicht es Ihnen, dem von Ihnen erzeugten neuen Symbol einen geeigneten Namen zuzuordnen. Alle Symbole in einer Bibliothek müssen über eindeutige Namen verfügen. Das System führt eine Überprüfung durch, um sicherzustellen, daß Sie eindeutige Namen zugeteilt haben, wenn Sie OK wählen. Falls der spezifizierte Name bereits in der Bibliothek verwendet wird, warnt Sie das System und gibt Ihnen die Möglichkeit, einen anderen Namen anzugeben.

Farbverwendung

Dieses Kontrollkästchen ermöglicht es Ihnen, zu spezifizieren, ob das Symbol, wenn es vom Trimble Geomatics Office-System verwendet wird, die Bildschirmfarben festlegen wird oder nicht. Aktivieren Sie diese Option, und die Farbpalette in der Symbolleiste wird verfügbar, und bei Bedarf kann das Symbol unter Verwendung von mehreren Farben erzeugt werden. Mit dieser Option aktiviert steht einem Symbol, das einem Punktstil in dem Trimble Geomatics Office-System zugeordnet ist, das Feld Farbauswahl in der Stil-Definition nicht zur Verfügung. Es ist auf “Vom Symbol” eingestellt, um anzuzeigen, daß die in dem Symbol festgelegten Farben immer verwendet werden, wenn das Trimble Geomatics Office-System das Symbol darstellt oder plottet.


Symbol-Einstellungen

Das Dialogfenster Symbol-Einstellungen erscheint, wenn Sie die Option Symbol | Einstellungen wählen, um die Einstellungen für das momentan gewählte Symbol zu ändern.

Symbolname

Dieses Feld ermöglicht es Ihnen, das momentan gewählte Symbol umzubenennen. Alle Symbole in einer Bibliothek müssen über eindeutige Namen verfügen. Das System führt eine Überprüfung durch, um sicherzustellen, daß Sie eindeutige Namen zugeteilt haben, wenn Sie OK wählen. Falls der spezifizierte Name bereits in der Bibliothek verwendet wird, warnt Sie das System und gibt Ihnen die Möglichkeit, einen anderen Namen anzugeben.

Farbverwendung

Dieses Kontrollkästchen ermöglicht es Ihnen, zu spezifizieren, ob das Symbol, wenn es vom Trimble Geomatics Office-System verwendet wird, die Bildschirmfarben festlegen wird oder nicht. Aktivieren Sie diese Option, und die Farbpalette in der Symbolleiste wird verfügbar, und bei Bedarf kann das Symbol unter Verwendung von mehreren Farben erzeugt werden. Mit dieser Option aktiviert steht einem Symbol, das einem Punktstil in dem Trimble Geomatics Office-System zugeordnet ist, das Feld Farbauswahl in der Stil-Definition nicht zur Verfügung. Es ist auf “Vom Symbol” eingestellt, um anzuzeigen, daß die in dem Symbol festgelegten Farben immer verwendet werden, wenn das Trimble Geomatics Office-System das Symbol darstellt oder plottet.


Symbol Wählen

Erscheint als

Verwenden Sie die Option Wählen oder klicken Sie auf die Schaltfläche Wählen von der Symbolleiste, um auf Auswahl-Modus umzuschalten (durch das Pfeilsymbol der Maus verdeutlicht). Auswahl-Modus ermöglicht es Ihnen, Elemente in dem momentanen Symbol oder Linientyp für Bearbeitungszwecke und zur Verwendung in den Optionen Ausschneiden, Kopieren und Löschen durch Klicken der Maustaste auszuwählen, wenn ein Element nahe ist. Sie können mehrere Elemente auswählen, indem Sie die Umschalttaste gedrückt halten, wenn Sie, nachdem die erste Auswahl durchgeführt ist, auf Elemente klicken. Wenn Sie die Umschalttaste gedrückt halten und auf ein bereits ausgewähltes Element klicken, wird die Auswahl rückgängig gemacht. Wenn Sie die Maus im Leerraum klicken (d.h. nicht in der Nähe eines Elements oder Linientyps) während Sie sich im Auswahl-Modus befinden und dabei nicht die Umschalttaste gedrückt haben, wird die Auswahl jeglicher Elemente rückgängig gemacht.

Ein Element bearbeiten

Wenn Sie ein einzelnes Element auswählen, wird das Element gestrichelt und mit “Bearbeitungsgriffen” dargestellt. Im Falle einer gewählten Linie wird ein Bearbeitungsgriff an beiden Enden der Linie dargestellt, und bei einem gewählten Bogen erscheint ein Bearbeitungsgriff an beiden Enden des Bogens sowie in der Mitte des Bogens.

Wenn Sie den Auswahl-Mauszeiger über einem Bearbeitungsgriff plazieren, wird ein Vierwege-Pfeilsymbol zu dem Standardzeiger hinzugefügt.  Dies bedeutet, daß Sie den Bearbeitungsgriff mit Hilfe der Maus bewegen können, indem Sie die Maustaste gedrückt halten und den Bearbeitungsgriff zur benötigten neuen Position ziehen. Die Bearbeitungsgriffe an den Enden einer Linie oder eines Bogens ermöglichen die Modifikation bzgl. der Länge und Orientierung der Linie oder des Bogens. Der Bearbeitungsgriff in der Mitte eines Bogens erlaubt es Ihnen, die Krümmung des Bogens zu ändern, während die Endpunkte ihre Positionen beibehalten.

Ein Element bewegen

Dasselbe Bearbeitungssymbol erscheint, wenn Sie den Mauszeiger irgendwo entlang einer gewählten Linie oder eines gewählten Bogens plazieren. Dies bedeutet, daß Sie, indem Sie die Maustaste gedrückt halten, das gewählte Element oder die gewählten Elemente zu einem anderen Bereich im Gitternetz ziehen können. Während Sie das Element oder die Elemente entlangziehen, weisen diese durchgehende rote Linien auf. Wenn die Maustaste losgelassen wird, plaziert sich das Element oder die Elemente in seiner/ihren neuen Position(en) und sie erscheinen als gewählte Elemente.

Die Farbe eines Elements ändern

Wenn Sie ein oder mehrere Elemente ausgewählt haben, und wenn die Option Farben verwenden für das Symbol oder den Linientyp eingestellt ist, können Sie die Farbeinstellungspalette auf der Symbolleiste verwenden, um den Elementen eine neue Farbe zuzuteilen.

Den Symbol-Einfügungspunkt wählen

Wenn ein Symbol bearbeitet wird, wird der Einfügungspunkt mit Hilfe eines speziellen Kästchensymbols, das ein diagonales Kreuz vorweist, angezeigt. Dies weist auf die Koordinatenposition innerhalb des Symbols hin, das sich auf der Punktposition in der Datenbank befindet.

Ein Bearbeitungsgriff erscheint beim Einfügungspunkt des Symbols, wenn Sie auf das Symbol in Auswahl-Modus klicken. Das Symbol erscheint gestrichelt. Sie können den Einfügungspunkt wie benötigt zu einem neuen Platz ziehen. Wenn Sie den Einfügungspunkt zusammen mit anderen Elementen auswählen, kann der Einfügungspunkt zusammen mit ihnen verschoben werden.

Wenn Sie den Einfügungspunkt wählen, und Größenradius dargestellt ist, ist es möglich, den Größenradius zu ziehen und auf einen neuen Wert einzustellen. Dies ermöglicht es Ihnen, zu steuern, wie die Größeneinstellung von Symbolen im Trimble Geomatics Office-System gehandhabt wird.


Symbol Bogen

Erscheint als

Klicken Sie auf die Schaltfläche Bogen der Symbolleiste, um auf den Modus Bogen zeichnen umzuschalten.

Wenn man sich im Modus Bogen zeichnen befindet, wird der Mauszeiger zu einem Fadenkreuz-Symbol. Das Klicken der Maustaste wählt die momentane Position auf dem Gitternetz als den Start- oder Endpunkt für den hinzuzufügenden Bogen aus. Definieren Sie den ersten Bogenpunkt, und eine rote “Gummiband-”Linie, die dem Mauszeiger folgt, zeigt die Sehne zum Bogenendpunkt an. Ein weiteres Klicken der Maustaste resultiert im Speichern dieser Position als Bogenendpunkt, und die “Gummiband-”Linie wird zu einem “Gummibogen”, der anzeigt, wo sich der neue Bogen befindet. Weiteres Klicken der Maustaste resultiert im Speichern des so definierten Bogens unter Verwendung der momentan gewählten Farbe (überprüfen Sie Farben verwenden für den Symbol- oder Linientyp). Ein neues Gummiband beginnt von dem Bogenendpunkt, um bei der Plazierung des nächsten Bogenendpunktes zu assistieren. Das Klicken der rechten Maustaste startet eine neue Bogensequenz, ohne daß ein Bogen mit dem letzten Punkt verbunden wird. Die erneute Wahl dieser Option oder der Schaltfläche Bogen von der Symbolleiste startet ebenso eine neue Bogensequenz.

HINWEIS: Die Wahl der Option Zeichnen | Linie oder der Schaltfläche Linie von der Symbolleiste vor der Bestimmung des Endpunktes für einen Bogen bewirkt das Umschalten auf den Modus Linie zeichnen, wobei der momentane Bogenstartpunkt als Startpunkt für die neue Linie beibehalten wird. Wenn Sie dabei sind, den Punkt auf dem Bogen zu wählen, dann resultiert das Umschalten auf den Modus Linie zeichnen darin, daß die spezifischen Start- und Endpunkte des Bogens ignoriert werden.

TIPS:

1. Sie können einen Kreis als Teil einer Symbol- oder Linientyp-Definition erzeugen, indem Sie dieselbe Position für die Start- und Endpunkte wählen und daraufhin den Punkt auf dem Bogen/Kreis zur entsprechenden Position ziehen.

2. Wenn Sie einen Bogen hinzufügen, können Sie den Mauszeiger bei Bedarf mit den Pfeiltasten der Tastatur “fahren”. Dies kann in einigen Fällen schneller und einfacher sein als die Maus selbst zu bewegen. Um eine Position auszuwählen, drücken Sie die Leertaste.


Symbol Linie

Erscheint als

Klicken Sie auf die Schaltfläche Linie, um auf den Modus Linie zeichnen umzuschalten.

Wenn man sich im Modus Linie zeichnen befindet, wird der Mauszeiger zu einem Fadenkreuz-Symbol. Das Klicken der Maustaste wählt die momentane Position auf dem Gitternetz als den Start- oder Endpunkt für die hinzuzufügende Linie aus. Definieren Sie den ersten Linienpunkt, und eine rote “Gummiband-”Linie, die dem Mauszeiger folgt, erscheint, wo die nächste Linie hinzugefügt werden wird. Ein weiteres Klicken der Maustaste resultiert im Speichern dieser Linie unter Verwendung der momentan gewählten Farbe (überprüfen Sie Farben verwenden für den Symbol- oder Linientyp), und eine rote “Gummiband-”Linie beginnt von diesem letzten Punkt. Das Klicken der rechten Maustaste startet eine neue Liniensequenz, ohne daß eine Linie mit dem letzten Punkt verbunden wird. Die erneute Wahl dieser Option oder der Schaltfläche Linie von der Symbolleiste startet ebenso eine neue Liniensequenz.

HINWEIS: Die Wahl der Option Zeichnen | Bogen oder der Schaltfläche Bogen von der Symbolleiste bewirkt das Umschalten zum Modus Bogen zeichnen, wobei der momentane Linienstartpunkt als Startpunkt für den neuen Bogen beibehalten wird.

TIP: Wenn Sie eine neue Linie hinzufügen, können Sie den Mauszeiger bei Bedarf mit den Pfeiltasten der Tastatur “fahren”. Dies kann in einigen Fällen schneller und einfacher sein als die Maus selbst zu bewegen. Um eine Position auszuwählen, drücken Sie die Leertaste.


Symbol Rückgängig

Erscheint als

Klicken Sie auf die Schaltfläche Rückgängig, um den zuletzt mit dem momentanen Symbol oder Linientyp ausgeführten Vorgang rückgängig zu machen oder “zurückzurollen”.

HINWEIS: Es ist nur möglich, Vorgänge mit dem momentan gewählten Symbol oder Linientyp rückgängig zu machen. Wenn Sie ein anderes Symbol oder einen anderen Linientyp gewählt haben, wird der “Rückgängig-Stapel” neu angefangen und ermöglicht es Ihnen dann, nur die mit dem neuen Symbol oder Linientyp zusammenhängenden Vorgänge rückgängig zu machen.


Farbsymbol einstellen

Erscheint als

Eine Palette der 16 verfügbaren Farben erscheint auf der Symbolleiste.

Wenn Sie Farben verwenden für das Symbol oder den Linientyp (wenn ein neues Symbol oder ein neuer Linientyp zu den Symbol- oder Linientyp-Einstellungen hinzugefügt wird) aktivieren, erscheint die Palette mit allen entsprechenden Farben. Wenn Sie diese Einstellung nicht aktivieren, steht die Palette nicht zur Verfügung und wird in Grau angezeigt.

Während Sie Linien oder Bogen zu einer Definition hinzufügen, können Sie die zutreffende Farbe für jedes Element unter Verwendung der Palette wählen, indem Sie auf das Kästchen mit der entsprechenden Farbe klicken. Genauso können Sie, wenn Sie ein oder mehrere Elemente gewählt haben, die Farbe dieser Elemente durch Klicken auf das entsprechende Farbkästchen der Palette ändern.


Farbbeispiele

Das Farbbeispielkästchen auf der Symbolleiste zeigt an, welche Farbe momentan von der Farbpalette gewählt ist und demzufolge welche Farbe für die nächste Linie oder den nächsten Bogen, die zur momentanen Symbol- oder Linientyp-Definition hinzugefügt werden, verwendet werden.

Falls Sie Farben verwenden für das Symbol oder den Linientyp (wenn ein neues Symbol oder ein neuer Linientyp zu den Symbol- oder Linientyp-Einstellungen hinzugefügt wird) nicht aktivieren, bleibt das Farbbeispiel schwarz und die Farbpalette steht nicht zur Verfügung. Dies weist darauf hin, daß alle neu hinzugefügten Linien oder Bogen auf dem Bildschirm mit schwarzen Linien erscheinen, und daß im Trimble Geomatics Office-System die in der Punkt- oder Linienstil-Definition bestimmten Farbzuweisungen für die Darstellung des Symbols oder Linientyps verwendet werden.


Farben verwenden

Wenn Sie sich im Modus Symbol-Editor befinden, erscheint das Kontrollkästchen Farben verwenden in den Dialogfeldern Neues Symbol hinzufügen und Symbol-Einstellungen.

Wenn Sie sich im Modus Linientyp-Editor befinden, erscheint das Kontrollkästchen Farben verwenden in den Dialogfeldern Neuen Linientyp hinzufügen und Linientyp-Einstellungen.

Dieses Kontrollkästchen erlaubt Ihnen, zu bestimmen, ob das Symbol/der Linientyp die Farben definiert, die zur Verfügung stehen, wenn das Trimble Geomatics Office-System dieses Symbol verwendet. Aktivieren Sie diese Option, und die Farbpalette in der Symbolleiste wird verfügbar, und das Symbol kann bei Bedarf unter Verwendung von mehreren Farben erzeugt werden.

Wenn ein Symbol oder Linientyp mit dieser Option aktiviert einem Punkt- oder Linientstil im Trimble Geomatics Office-System zugeteilt wird, steht die Farbauswahl in der Stil-Definition nicht zur Verfügung. Es ist auf “Vom Symbol” oder “Vom Linientyp” eingestellt, um darauf hinzuweisen, daß die in dem Symbol oder Linientyp definierten Farben immer verwendet werden, wenn das Symbol oder der Linientyp dargestellt oder geplottet werden.


Datei | Öffnen

Verwenden Sie die Option Öffnen, um eine existierende Symbol- oder Linientyp-Bibliothek zu öffnen.

Das Microsoft Windows Standardfenster Öffnen ist dargestellt, um Ihnen bei der Auswahl der zu öffnenden Bibliothek-Datei zu assistieren.

Sie können diese Option verwenden, um eine TRIMMAP- oder TrimCAD-Symbol-Bibliothek (SYMBOLS.DAT) oder eine TRIMMAP- oder TrimCAD-Linientyp-Bibliothek (PATTERNS.DAT) zu öffnen. Wenn Sie dies durchführen, wird der Inhalt der Bibliothek gelesen und in die vom Trimble Geomatics Office-System verwendete Form konvertiert. Sie können daraufhin die konvertierte Bibliothek in einer neuen Datei speichern.

Wenn eine Bibliothek bereits bearbeitet wird, gibt Ihnen das Trimble Geomatics Office-System die Möglichkeit, diese Bibliothek zu speichern, bevor sie durch die neu geöffnete Bibliothek ersetzt wird.


Datei | Neu

Verwenden Sie die Option Neu, um eine neue Symbol- oder Linientyp-Bibliothek zu erstellen.

Wenn eine Bibliothek bereits bearbeitet wird, gibt Ihnen das Trimble Geomatics Office-System die Möglichkeit, diese Bibliothek zu speichern, bevor durch die neue  Bibliothek ersetzt wird.


Datei | Speichern

Verwenden Sie die Option Speichern, um eine Symbol- oder Linientyp-Bibliothek unter ihrem momentanen Namen und ihrer momentanen Position zu speichern. Dies aktualisiert die Bibliothek mit jeglichen während der Bearbeitungssitzung durchgeführten Änderungen.

Wenn die Bibliothek, die Sie speichern, nicht die momentane Trimble Geomatics Office-System-Bibliothek ist, erhalten Sie die Möglichkeit, die gespeicherte Bibliothek als System-Bibliothek einzusetzen. Die Trimble Geomatics Office-System Symbol- und Linientyp-Bibliotheken sind die Bibliotheken, die automatisch verwendet werden, wenn das System ausgeführt wird.


Datei | Speichern unter

Verwenden Sie die Option Speichern unter, um den Dateinamen und die Position zu spezifizieren,  worunter Sie die Symbol- oder Linientyp-Bibliothek speichern möchten. Normalerweise können Sie diese Option benutzen, um die Kopie einer Bibliothek unter einem neuen Namen zu speichern.

Wenn die Bibliothek, die Sie speichern, nicht die momentane Trimble Geomatics Office-System-Bibliothek ist, haben Sie die Möglichkeit, die gespeicherte Bibliothek als System-Bibliothek einzusetzen. Die Trimble Geomatics Office-System Symbol- und Linientyp-Bibliotheken sind die Bibliotheken, die automatisch verwendet werden, wenn das System ausgeführt wird.


Datei | Beenden

Verwenden Sie die Option Beenden, um das Symbol- oder Linientyp-Bearbeitungsprogramm zu beenden. Falls Sie die momentane Bibliothek seit dem letzten Speichern geändert haben, gibt Ihnen das System die Möglichkeit, die Bibliothek zu speichern, bevor Sie das Programm verlassen.


Menü "Datei"

Die folgenden Optionen stehen zur Verfügung:

Neu

Öffnen

Speichern

Speichern als

Beenden