Copyright: ｩ 1997 - 2002 Trimble Navigation Limited. All rights reserved.
Citation: ｩ 1997 - 2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office™ソフトウェアのTrimble DTMLink™ソフトウエアはコンタ面モデルを生成するパワフルなシステムです。このソフトウエアを使って、新しいコンタ面を作成したり、以前作成されたコンタ面を編集したりできます。他のコンタ用パッケージで生成されたコンタ面をインポートすることもできます。

このソフトウエアはコンタ面モデルの境界線とブレークラインを含むことができます。それは、面形成に対するコントロール能力を増加するための高度な三角編集を可能にします

グリッドされたか三角測量されたデジタル地形モデルは、データコレクターかデータファイルへのエクスポート用のコンタ面モデル　から作成されます

作成するモデルは土工事計算のためのRoadLink™ソフトウエアに使用されることがあります。

DTMLinkソフトウエアでは容積レポートを作成することができます。

容積計算の典型的なアプリケーションは以下の通りです。

　　補給材料計算

　　炭層のような原料層の容積

　　建設予定ダム後方の湖のような空隙の容積

DTMLinkソフトウエアは個々の三角プリズムの容積を算出する方法を使用します。これは、プリズムのベース部分と平均高度を使用することでコンタ面モデルを形成する三角平面によって定義されます。

DTMLinkソフトウエアでは比較面を作成することができます。比較面とは２面間の差異のコンタ面モデルです。２面間の切土や盛土の容積を計算するために、容積計算タイプ「標高以上」と連携してこの面を使用することができます。


目次

以下のヘルプ項目をご利用いただけます。

１.Trimble DTMLink ソフトウエア

2.メニューコマンド

3.ヒント

4.エラーメッセージ

5.全項目

ここではMicrosoft Windowsの使用方法をご存知と仮定して進めていきます。Windows ソフトウエアのご利用方法に関してはMicrosoft Windowsのマニュアルをご参照ください。


全項目

目次の全項目セクションでは､このヘルプシステムのすべての項目がアルファベット順/五十音順に並べられています。


面を開く
ファイル / 面を開く

	標準ツールバーの「面を開く」ツールをクリックします。
面を開くためにこのコマンドを使用します。

このフォルダにある使用可能な面

面の選択ダイアログの下欄に示された名前の一覧から名前を選択し、　「このフォルダにある使用可能な面」フィールドの下のフィールドにこの名前を入力します。名前が一覧にない場合には、フォルダをクリックします。

注：　「このフォルダにある使用可能な面」フィールドは読み取り専用です。

フォルダ

「フォルダを参照」ダイアログを開くにはフォルダをクリックします。ダイアログではファイルが含まれるフォルダを選択することができます。

標準設定フォルダは　C:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\RoadLink 縫TMLink �です。ｘｘ　はプロジェクト名です。

ヒント：　「フォルダを参照」ダイアログを使用する場合には、常にディレクトリの一番下のレベルで面ファイルを探すようにしてください。


面の保存
ファイル/面の保存

	標準ツールバーの「面の保存」ツールを使用します。

現在の面への変更を保存するためにこのコマンドを使用します。


面を閉じる
ファイル/面を閉じる

DTMLink?ソフトウエア内のファイルを閉じるためにこのコマンドを使用します。


インポート
ファイル/インポート

	標準ツールバーの「インポート」ツールを使用します。

このコマンドを使用して､以下のファイルタイプをプロジェクトにインポートします。

Trimble TIN デジタル地勢モデルファイル(*.ttm)

Trimble グリッドデジタル地勢モデルファイル(*.dtx)

TerraModel プロジェクトファイル(*.pro)からの面(TIN)

AutoCAD DXF ファイルからの面(TIN)

LandXMLファイル(*.xml)からの面

Paydirt/SiteWork グリッドファイル(*.grd)

Civilcad ASCII 5 ファイル

12D 面ファイル

InRoads 面ファイル

MX GENIO TIN ファイル

REB 面ファイル

GEOPAK Grid Spots


Trimble TIN デジタル地勢モデルファイル(*.ttm)

このコマンドを使用して､Trimble TIN デジタル地勢モデルファイルをDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからTrimble TIN デジタル地勢モデルファイル(*.ttm)を選択し､OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

ファイルタイプのフィールドは､Trimble TIN デジタル地勢モデル(*.ttm)タイプしか表示しません。このフィールドからファイルタイプの変更はできません。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


Trimble グリッドデジタル地勢モデルファイル(*.dtx)

このコマンドを使用して､Trimble グリッドデジタル地勢モデルファイルをDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからTrimble グリッドデジタル地勢モデルファイル(*.dtx)を選択します。

ヒント:設定ボタンをクリックすると、グリッドを定義し、指定許容値内に入るポイントを除去できます。

3.	OK をクリックします。

開くダイアログが現れます｡

4.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

ファイルタイプのフィールドは､Trimble グリッドデジタル地勢モデル(*.dtx)タイプしか表示しません。このフィールドからファイルタイプの変更はできません。

5.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

6.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


グリッドDTM設定のインポート

このオプションを使用して､グリッドを定義し、指定許容値内に入るポイントを除去します。「グリッドの減少」を選択し､グリッドからTINへの減少許容値フィールドで許容値を指定します。


TerraModel プロジェクトファイル(*.pro)からの面(TIN)

このコマンドを使用して､TerraModel プロジェクトファイルからの面(TIN)をDTMLink にインポートします。

注:面(TIN)ファイルの転換に成功するには、TerraModel プロジェクトファイルはレイヤー内に三角形のネットワークを持つ必要があります。

ファイルをインポートするには､

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからTerraModel プロジェクトファイル(*.pro)からの面(TIN)を選択し､OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックします。

ファイルがレイヤーを1つしか持たない場合に面はインポートを行います。同じ名前の面が既にプロジェクトに存在する場合には､面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。

TerraModel プロジェクトファイルが複数のレイヤーを持つ場合には、面レイヤーの選択ダイアログが現れます｡

6.	インポートするレイヤーを選択します。同じ名前の面が既にプロジェクトに存在する場合には､面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


面レイヤーの選択ダイアログ

このダイアログを使用して､インポートするために転換するレイヤーを選択します｡

レイヤーリストから、面ファイルに転換するレイヤーを選択します｡複数のレイヤーをインポートするように選択できますが、一度に表示できる面は1つだけです。


AutoCAD DXFファイルからの面(TIN)

このコマンドを使用して､AutoCAD DXFファイルから面(TIN)をDTMLinkにインポートします。

注:面(TIN)ファイルの転換に成功するには、AutoCAD DXFファイルは3D面か3Dポリラインの三角形のネットワークから構成される必要があります。

ファイルをインポートするには､

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	DXFファイルがプロジェクトで指定された単位以外を使用して最初に生成された場合には､設定をクリックしてDXFファイルを設定します。

DXFインポートの設定オプションダイアログが現れます｡このダイアログを使用して､インポートされ転換されたDXFファイルに単位を割当てます。DXFファイルが最初に生成されたのと同じ単位を指定しなければなりません。

3.	DXFファイルに適切な単位を選択します｡

4.	DXFインポートの設定オプションダイアログでOK をクリックします。

5.	インポートダイアログでOK をクリックします。

開くダイアログが現れます｡

6.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

ファイルタイプのフィールドは､ASCII AutoCAD DXFファイル(*.dxf)タイプしか表示しません。このフィールドからファイルタイプの変更はできません。

7.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

8.	開くをクリックします。

ファイルがレイヤーを1つしか持たない場合に面はインポートを行います。同じ名前の面が既にプロジェクトに存在する場合には､面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。

DXFファイルが複数のレイヤーを持つ場合には、面レイヤーの選択ダイアログが現れます｡

9.	インポートするレイヤーを選択します。同じ名前の面が既にプロジェクトに存在する場合には､面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


DXFインポートの設定オプションダイアログ

このダイアログを使用して､AutoCAD DXFファイルから面(TIN)をインポートするための単位を設定します。

DXF ファイルの単位

このフィールドを使用して、インポートしているDXFファイルに単位を割当てます。例えば､DTMLink プロジェクトがその座標に国際フィートを使用するけれども、*.dxf ファイルがメートルで生成された場合には、その*.dxf ファイルをインポートする時にはこのグループでメートルを指定する必要があります。

単位を変更するには、ドロップダウンリストから選択します。

メートル(m)

国際フィート(ft)

US 測量フィート(FT)

注:AutoCAD DXF ファイルから面(TIN)をインポートする時には、ポリライン圧縮フィールドは利用できません。


LandXML ファイル(*.xml)からの面

このコマンドを使用して､LandXML ファイルからDTMLinkに面をインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからLandXMLファイル(*.xml)からの面を選択して、OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


Paydirt/SiteWork グリッドファイル(*.grd)

このコマンドを使用して､SiteWorkグリッドファイルをDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストから､Paydirt/SiteWorkグリッドファイル(*.grd)を選択します｡

ヒント:設定ボタンをクリックして、グリッドを定義し、指定許容値内に入るポイントを除去します。

2.	インポートダイアログで、OKをクリックします。

SiteWorkグリッドファイルのインポートダイアログが現れます｡

3.	検索をクリックして、インポートしたいファイルを含むフォルダを検索します。

4.	ファイルフィールドで、必要なSiteWork グリッドファイルへとナビゲートします。

5.	OKをクリックして、面をインポートします。同じ名前の面が既にプロジェクトに存在する場合には､面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


SiteWorkグリッドファイルのインポートダイアログ

このダイアログを使用して､SiteWorkグリッドファイルをDTMLink ソフトウェアにインポートします。

場所

このフィールドは、SiteWork グリッドファイルの場所を表示します。

検索

このボタンをクリックして、SiteWork グリッドファイルが含まれるフォルダを検索します。

ファイル

このフィールドを使用して、SiteWork グリッドファイルを選択します。

OK

このボタンをクリックして、SiteWork グリッドファイルをインポートします。

取消

このボタンをクリックして、インポート操作を取消し、インポートダイアログに戻ります。


Civilcad ASCII 5 ファイル

このコマンドを使用して､Civilcad ASCII 5 ファイルをDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストから､Civilcad ASCII 5 ファイル(*.AS5)を選択します。

ヒント:設定ボタンをクリックして、グリッドを定義し、指定許容値内に入るポイントを除去します。

3.	OKをクリックします。

開くダイアログが現れます｡

4.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

5.	開くをクリックします。

面レイヤーの選択ダイアログが現れます｡

6.	グリッド情報を含むレイヤーを選択します｡

7.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


12D 面ファイル

このコマンドを使用して､12D 面ファイルをDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストから12D 面ファイルを選択して､OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


InRoads ファイル(*.tin)からの面

このコマンドを使用して､InRoads ファイルからの面をDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからInRoads 面ファイルを選択して､OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


MX GENIO TIN ファイル

このコマンドを使用して､MX GENIO TIN ファイ(*.txt)をDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからMX GENIO TIN ファイルを選択して､OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


GEOPAK Grid Spots

このコマンドを使用して､GEOPAK ファイルからのグリッドデジタル地勢モデル(*.dtx)をDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストから､GEOPAK Grid Spots を選択します。.

ヒント:設定ボタンをクリックして、グリッドを定義し、指定許容値内に入るポイントを除去します。

3.	OKをクリックします。

開くダイアログが現れます｡

4.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

ファイルタイプフィートは、すべてのファイル(*.*)タイプを表示します。GEOPAK ファイルは拡張子を持つことができないので、このフィートのファイルタイプを変更することはできません。

5.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

6.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


REB 面ファイル

このコマンドを使用して､REB 面ファイル(*.reb)をDTMLinkにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます｡

2.	面タブのリストからREB 面ファイルを選択して､OKをクリックします。

開くダイアログが現れます｡

3.	フォルダの場所フィールドで、インポートしたいファイルを含むフォルダを選択します｡DTMLinkは、最後にファイルをインポートしたフォルダを使用するかを尋ねます。

4.	以下の1つを行います｡

ファイル名を入力します｡

必要なファイルをクリックします。

5.	開くをクリックして、面をインポートします。同じ名前の面が既にプロジェクト内に存在する場合には、面のインポートダイアログが現れます｡インポートされる面に別の名前を付ける必要があります。


面のインポート

「面のインポート」ダイアログを使用して､新しい面に名前を付けます。このダイアログは、プロジェクト内に同じ名前の面が既に存在する場合にのみ現れます。

新しい面の名前

ファイル名が面に対する既定名です。このフィールドを使用して、面に独自の名前を付けることができます。


エクスポート
ファイル/エクスポート

	標準ツールバーの「エクスポート」ツールを使用します。

このコマンドを使用して、Survey ControllerかTDS装置にファイルをエクスポート（または送信）したり、ファイルを作成したりします。

注：　ASCII ファイルを出力するエクスポートフォーマットは、常に数値データを標準フォーマットで出力します。それには、多数のセパレータと小数点は含まれません。

エクスポートダイアログは使用可能なエクスポートフォーマットを一覧で示します。ダイアログのタブはエクスポートフォーマットのタイプを表示します。

システムタブ

このタブを使用して、使用可能なフォーマットのリストから選択します。

このエクスポートフォーマットを使用して�	�を作成します。
TIN DTM をTrimble Survey Controllerへ	Trimble Survey Controller に直接エクスポートを行うために選択されたポイントの互換性のある三角DTMファイル
TIN DTM をTrimble Survey Controller (*.ttm)へ	選択されたポイントの三角DTMファイル
グリッドDTM をTrimble Survey Controllerへ	Trimble Survey Controller に直接エクスポートを行うために選択されたポイントの互換性のあるグリッドDTMファイル
グリッドDTM をTrimble Survey Controller ファイル(*.dtx)へ	選択されたポイントのグリッドDTMファイル。ASCIIファイルに出力するグリッドDTM値は、常にメートルフォーマットです。
TIN DTM をTrimble 5600 TDSへ	Trimble 5600 TDS 機器に直接エクスポートを行うために選択されたポイントの互換性のある三角DTMファイル
TIN DTM をTrimble 5600 TDSファイル(*.dtm)へ	TDS Survey Pro CEを実行しているTrimble 5600 TDS 機器で読み込み可能なTrimble 5600 TDS ファイル(*.dtm)としての選択ポイントの三角DTMファイル
TIN DTM をTDS Survey Pro CEへ	TDS Survey Pro CE コントローラに直接エクスポートを行うために選択されたポイントの互換性のある三角DTMファイル
TIN DTM をTDS Survey Pro CE ファイル(*.dtm)へ	TDS Survey Pro CE コントローラで読み込み可能な選択ポイントの三角DTMファイル
3D面のAutoCAD DXFファイル	サードパーティーソフトウエアへの読込み可能な3D面のASCII DXFファイル。3D面エンティティがコンタモデルの各三角形対して書き出されます。
コンタをAutoCAD DXFファイルへ	サードパーティーソフトウエアへの読込み可能なコンタのASCII DXFファイル。出力オプションを特定するためには設定　をクリックしてください。
　関連事項


Trimble Survey Controller のグリッドDTM

コンタモデルから補間したポイントの標高とグリッドデータの普通のセットを作成するためにこのタイプを使用します。

注：　グリッドデジタル地形モデル（DTM）は現在のコンタモデルから補間されたポイントの普通の南北・東西グリッドを受け入れます。

Ｔｒｉｍｂｌｅ　Survey Controller™ソフトウエアのバージョン6.5以上にエクスポートするためにグリッドDTMを作成するにはファイル/エクスポートコマンドを使用します。

「グリッドDTMをTrimble Survey Controllerへ」　か「グリッドDTMをTrimble Survey Controller ファイルへ」のエクスポートオプションを選択します。

OKをクリックすると、グラフィックウインドウに長方形のグリッドが現れます。　この長方形のグリッドは、面を完全に拘束する一番小さい長方形を示します。長方形のグリッド境界線をドラッグすることで、希望するエリアを定義することができます。

ヒント：　長方形のサイズを微調整するには、グリッド設定ダイアロググループボックスの左、上、右、下フィールドを使用します。

グリッド設定ダイアログのフィールドは以下の通りです。

左

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの左側、東に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形左端をドラッグする範囲を示します。

上

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの上、北に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形上端をドラッグする範囲を示します。

右

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの右側、東に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形右端をドラッグする範囲を示します。

下

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの下、北に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形下端をドラッグする範囲を示します。

グリッドサイズ

グリッドを構成する列と行の数を特定するためにはグリッドサイズタブのフィールドを使用します。

列	グリッド設定のために列数を入力します。
行	グリッド設定のために行数を入力します。
このフィールドはどちらも10（標準設定）に設定されています。これは長方形を基本として形成されるグリッドを持つことが可能であることを意味します。

注：　グリッドサイズタブで行数か列数、または両方を変更する時、ステップサイズタブの高さと幅はDTMＬｉｎｋ?　ソフトウエアによって自動的に再計算されます。更新されたフィールドは各ステップサイズに新しい高さと幅を示します。

ステップサイズ

グリッドを構成する列と行のそれぞれの高さと幅を特定するためにはステップサイズタブのフィールドを使用します。

幅	列の幅に対する値を入力します。
高さ	行の高さに対する値を入力します。
注：　ステップサイズタブで幅や高さ、またはその両方を変更する場合には、グリッドサイズタブの再計算が行われます。

OK

OKをクリックしてグリッドDTMをエクスポートします。ファイルは、各グリッドポイントでの座標と補間された標高の一覧を提供します。「グリッドDTMをSurvey Controllerへ」のエクスポートオプションを選択した場合には、ファイルを保存する装置を選択することができます。

注：　境界線長方形の中にあるけれどもコンタ面の外にあるグリッドポイントは補間された標高を持たないので、ファイルの中では無記入のラインとしてレポートされます。


Trimble Survey Controller の三角DTM

コンタモデルの三角形を定義するポイントを基礎とする三角データを作成するためには、このタイプを使用します。

Trimble Survey Controllerソフトウエアのバージョン7.5以上にエクスポートするために三角DTMを作成するには、

1.	ファイル　/　エクスポートを選択します。

2.	エクスポートダイアログで、以下の1つを選択します。

TIN DTMをSurvey Controllerへ

TIN DTMをSurvey Controllerファイルへ

3.	OK をクリックします。

グラフィックウインドウで、グリッドは、面を完全に拘束する一番小さい長方形を示します。グリッド境界線をドラッグして、希望するエリアを定義します。

ヒント：　長方形のサイズを微調整するには、ＴＩＮ範囲ダイアログ、グループボックスの左、上、右、下フィールドを使用します。

左

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの左（東）側に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形左端をドラッグする範囲を示します。

上

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの上（北）に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形上端をドラッグする範囲を示します。

右

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの右（東）側に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形右端をドラッグする範囲を示します。

下

メートルか国際フィート、ＵＳ測量フィートで測定されたボックスの下（南）側に対する値を入力するか、フィールド記入を使用します。このフィールドは、グラフィックウインドウ内の長方形下端をドラッグする範囲を示します。

OK

OKをクリックして三角DTMをエクスポートします。ファイルは、各三角形の座標と標高の一覧を提供します。「TIN DTMをTrimble Survey Controllerへ」のエクスポートオプションを選択した場合には、ファイルを保存する装置を選択することができます。


Trimble 5600 TDS の三角DTM

コンタモデルの三角形を定義するポイントを基礎とする三角データを作成するためには、このタイプを使用します。

Trimble 5600 TDSにエクスポートするために三角DTMを作成するには、

1.	ファイル　/　エクスポートを選択します。

2.	エクスポートダイアログで、以下の1つを選択します。

TIN DTMをTrimble 5600 TDSへ

TIN DTMをTrimble 5600 TDSファイルへ

3.	設定ボタンをクリックして、エクスポートされるファイルの単位を指定します。このオプションを使用して、DTMLink プロジェクトの単位以外でTIN DTMのエクスポートを行います。

4.	OK をクリックして、三角DTMをエクスポートします。


TDS Survey Pro CE の三角DTM

コンタモデルの三角形を定義するポイントを基礎とする三角データを作成するためには、このタイプを使用します。

TDS Survey Pro CE にエクスポートするために三角DTMを作成するには、

1.	ファイル　/　エクスポートを選択します。

2.	エクスポートダイアログで、以下の1つを選択します。

TIN DTMをTDS Survey Pro CEへ

TIN DTMをTDS Survey Pro CEファイルへ

3.	設定ボタンをクリックして、エクスポートされるファイルの単位を指定します。DTMLink プロジェクトの単位以外でTIN DTMのエクスポートを行いたい時に、このオプションを使用します。

4.	OK をクリックして、三角DTMをエクスポートします。


TDS TIN DTMのエクスポートオプション

このオプションを使用して、DTMLink プロジェクトの単位以外でTIN DTM をエクスポートします。ファイル単位リストから適切な単位を選択します。


面の名前変更
ファイル/面の名前変更

現在の面ファイルの名前を変更するのにこのコマンドを使用します。

面の名前変更ダイアログが表示されます。フィールドの現在の面に対する新しい名前を入力します。

OKをクリックして現在の面ファイルの名前を変更します。


面のコピー
ファイル / 面のコピー

現在の面ファイルをコピーするのにこのコマンドを使用します。

面のコピーダイアログが表示されます。

新しい面に対する独特な名前を入力します。

OK

OKをクリックして面をコピーします。


面の削除
ファイル/面の削除

面を削除するのにこのコマンドを使用します。

フォルダ

フォルダをクリックして「フォルダを参照」ダイアログを開きます。このダイアログでは開きたい面ファイルまで移動できます。

面はC:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\RoadLink -DTMLink �に保存されています。　xx　はプロジェクト名です。

ヒント：　ファイルを復元するにはMicrosoft Windowsのごみ箱を利用します。


終了
ファイル / 終了

現在の面を閉じてDTMＬｉｎｋ™ソフトウエアを終了するためにこのコマンドを使用します。


ファイルメニュー

面を管理するためにファイルメニューを使用します。それには次のようなコマンドがあります。

面を開く

面の保存

面を閉じる

インポート

エクスポート

面の名前変更

面のコピー

面の削除

終了


3D面のAutoCAD DXFファイル

DTMＬｉｎｋは3D面のASCII DXFファイルを作成します。各三角頂点の標高と座標は、DXFフォーマットでファイルに書き込まれます。

DXF 3D面ファイルのエクスポート方法

１．	ファイル/エクスポートのコマンドを使用します。

2.	3D面のAutoCAD DXFのエクスポートオプションを選択します。

3.	OKをクリックします。

「3D面をDXFファイルにエクスポート」のダイアログが現れます。

4.	ファイル名フィールドにファイル名を入力します。

５．	保存をクリックします。

ファイルは標準設定のC:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\RoadLink 縫TMLink �に保存されます。xx はプロジェクト名です。


コンタをAutoCAD DXFファイルへ

コンタのASCII DXFファイルを作成するためにこのオプションを使用します。

DXFコンタファイルのエクスポート方法

1.	ファイル　/　エクスポートを選択します。

エクスポートダイアログが現れます。

2.	コンタのASCII DXFファイルを作成するためにこのエクスポートフォーマットを選択します。このファイルが読み込まれ、Trimble Geomatics Office™　ソフトウエアと適応するサードパーティーソフトウエアにコンタが表示されます。

３．	設定をクリックして出力オプションを特定します。

DXFコンタオプションダイアログが現れます。

４．	以下から１つを選択します。

　　コンタを直線としてエクスポートするための直線オプション

　　コンタを近似曲線のラインセグメントとしてエクスポートするためのラインセグメントオプション

５．	ラインセグメントの最大の長さを特定します。

６．	OKをクリックして出力オプションを承認します。

エクスポートダイアログが現れます。

7.	OKをクリックします。

「コンタをDXFファイルへエクスポート」ダイアログが現れます。

８．	ファイル名を入力します。

９．	保存をクリックしてファイルをエクスポートします。

ファイルは標準設定のC:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\RoadLink 縫TMＬｉｎｋ�に保存されます。xx はプロジェクト名です。


DXF コンタオプション

このダイアログを使用してDXFコンタ出力オプションを特定します。

コンタラインを直線としてか、あるいは近似曲線のラインセグメントとしてエクスポートするかを選択できます。

曲線に近似したラインセグメントを選択すると、ラインセグメントの長さを指定できます。ラインセグメントが短ければ短いほど、優れた近似曲線を描きますが、DXFファイルはそれだけ多くのポイントを含むようになります。


開くダイアログ

これは、標準の「開く」ダイアログです。

1.	必要なフォルダを検索します。

2.	ファイルのタイプを選択します｡

3.	ファイルを選択します｡


元に戻す
編集/元に戻す

	標準ﾂｰﾙﾊﾞｰの「元に戻す」ﾂｰﾙをｸﾘｯｸします。

このｺﾏﾝﾄﾞ､またはﾂｰﾙを使用して､面に対して行われた最後の修正を元に戻します。ﾒﾆｭｰｺﾏﾝﾄﾞのﾃｷｽﾄがその修正が何であるかを示してくれます。


編集ﾒﾆｭｰ

編集ﾒﾆｭｰを使用して､面に対して行われた最後の修正を元に戻します。

それには以下のｺﾏﾝﾄﾞがあります。

元に戻す


ﾍﾙﾌﾟﾄﾋﾟｯｸｽ
ﾍﾙﾌﾟ/ ﾍﾙﾌﾟﾄﾋﾟｯｸｽ

DTMLink™ｿﾌﾄｳｴｱのｺﾏﾝﾄﾞはﾒﾆｭｰでｸﾞﾙｰﾌﾟ化されています。

ﾒﾆｭｰｺﾏﾝﾄﾞは以下の通りです。

ﾌｧｲﾙ

編集

表示

設計

ﾂｰﾙ

ｳｲﾝﾄﾞｳｽ

ﾍﾙﾌﾟ


ﾊﾞｰｼﾞｮﾝ情報
ﾍﾙﾌﾟ/ ﾊﾞｰｼﾞｮﾝ情報

ﾍﾙﾌﾟﾒﾆｭｰのﾊﾞｰｼﾞｮﾝ情報ｺﾏﾝﾄﾞはDTMLink™ ｿﾌﾄｳｴｱのﾌﾟﾛｸﾞﾗﾑや著作権情報を表示します。

注: 記録保管とﾊﾞｯｸｱｯﾌﾟの目的以外でこのﾌﾟﾛｸﾞﾗﾑをｺﾋﾟｰすることは禁止されています。

ﾃｸﾆｶﾙｻﾎﾟｰﾄが必要な故障が発生した場合にはこの情報が必要になります。


ﾋﾝﾄ
ﾍﾙﾌﾟ/ ﾋﾝﾄ

ﾋﾝﾄｼｽﾃﾑは､ｼｽﾃﾑで作業をするにあたって手助けとなるようなﾋﾝﾄを提供してくれます。このｵﾌﾟｼｮﾝを選択すると次のﾋﾝﾄを表示します。ﾋﾝﾄﾀﾞｲｱﾛｸﾞのﾁｪｯｸﾎﾞｯｸｽで､ｼｽﾃﾑを起動するたびにﾋﾝﾄが現れるようにするかどうかを選択できます。


ﾍﾙﾌﾟﾒﾆｭｰ

ﾍﾙﾌﾟﾒﾆｭｰはDTMLink™ｿﾌﾄｳｴｱに関する情報を提供します。それには次のｺﾏﾝﾄﾞがあります。

ﾍﾙﾌﾟﾄﾋﾟｯｸｽ

ﾋﾝﾄ

ﾊﾞｰｼﾞｮﾝ情報


ツールバーの使用

ツールバーは頻繁に使用されるメニューコマンドへの素早くかつ簡単なアクセスを提供します。各ツールバーボタンの上にマウスを置くとそのボタンの短い説明がステータスバーの上に表示されます。

例えば、面ツールバーの「ポイントを含む」ツールバーボタンの上に動くと、ステータスバーのメッセージペインの上に「面モデルの中にポイントを含めます」と表示されます。

作業環境に合わせてツールバーのどれかを隠したり移動させたりサイズを変えたりできます。

ツールバーをメインウィンドウの脇や、作業スペースの一番上にあるメニューの下や、作業スペースの一番下にあるステータスバーの下に移すことができます。そうでなければ、どのツールバーもスクリーン上のどこにでも移動したり、それを水平にまたは垂直に向けることもできます。

標準設定を復元するには、「表示」のツールバーで「リセット」をクリックします。（各ツールバーは、ツールバーのタイトルバーをダブルクリックすることで標準設定に戻ることができます。）

ツールヒント

ツールボタンの上にカーソルを置くと、ツールヒントと呼ばれる小さなウィンドウが現れて、そのツールの働きを教えてくれます。カーソルの近く、ツールの下に簡単な説明が表示されます。

注：　ツールバーをドッキングするとタイトルバーが隠れます。

３つのツールバーは以下の通りです。

標準ツールバー

表示ツールバー

面ツールバー


標準ツールバー

標準ツールバーは、主要なメニュー項目への素早いアクセスを提供します。

標準ツールバーからは以下のオプションが利用できます。

ボタン	メニューコマンド	説明
	ファイル　／　面を開く	現存する面を開きます。
	ファイル　／　面の保存	現在の面への変更を保存します。
	ファイル　／　インポート	サードパーティーソフトウェアパッケージからの面をインポートします。
	ファイル　／　エクスポート	Survey ControllerかTDS装置､ファイルにデータをエクスポートします。
	編集　／　元に戻す	最後のアクションを元に戻します。メニュー項目が元に戻すことのできる作業を提示します。
	表示　／　プロパティ	プロパティウィンドウを表示します。このウィンドウは面ポイントやブレークライン、境界線に関する情報を表示します。


表示ツールバー

表示ツールバーはメイングラフィックウィンドウでの表示を補助するためのナビゲートツールを提供します。

表示ツールバーでは以下のオプションを利用できます。

ボタン	メニューコマンド	説明
	ショートカットメニュー	「選択」ツールは、プロパティウィンドウで選択されたエンティティを表示するだけでなく、面ポイントやブレークライン、境界線を選択できます。
	表示　／　パン	ズームされたエリアの中心を移動します。
	表示　／　拡大	縮尺の増加に応じて表示を拡大します。
	表示　／　縮小	縮尺の減少に応じて表示を縮小します。
	表示　／　範囲調節	現在のプロジェクトの全エンティティをウィンドウが表示できるように縮尺を変更します。
	表示　／　前にズーム	前のスクリーン表示を表示します。
	表示　／　レイヤー	異なるレイヤーを表示したり隠したりします。
	表示　／　フローティングウィンドウ	現在選択されている表示にエンティティを小さい縮尺で表示するフローティングウィンドウを開きます。このウィンドウのサイズを変えたり移動したりすることができます。


面ツールバー

面ツールバーはDTMLink™ソフトウェアを効率良く使用するためのツールを提供します。

面の編集を補助するための面ツールバーからは以下のオプションを利用できます。

ボタン	メニューコマンド	説明
	設計　／　ポイントを含む	面モデルのポイントを含みます。
	設計　／　ポイントを外す	面モデルのポイントを含みません。
	設計　／　ラインの追加	境界線外にある面の一部を除去します。このツールを使ってブレークラインで境界線を定義することもできます。
	設計　／　ラインの追加	境界線内にある面の一部を除去します。このツールを使ってブレークラインで境界線を定義することもできます。
	設計　／　ラインの追加	２ポイント間にブレークラインを追加します。
	設計　／　ラインの削除	ブレークラインか境界線を削除します。 ボタンの右の矢印を押して削除するラインタイプを選択します。プルダウンメニューにあるオプションは以下の通りです。 すべて ブレークライン 外枠境界線 中抜境界線 外枠境界線とブレークライン 中抜境界線とブレークライン
	設計　／　三角の交換	凸四辺形を形成する２つの隣り合った三角形を交換します。
	設計　／　三角の削除	面モデルから三角を除外します。

ツールは他のツールが選択されるまで有効です。


ショートカットメニュー

ショートカットメニューを見るためにはグラフィックウインドウにいる間にマウスの右ボタンを使用してください。これはコンテキストの影響を受け易いメニューで、どのコンテキストでマウスの右ボタンをクリックするかによって利用できるオプションが変わります。

利用可能な主要コンテキスト　オプションは、

メイングラフィックウインドウです。

メイングラフィックウインドウ内のショートカットメニューは以下の通りです。


ショートカットキー

メニューバーからアクセスするメニューコマンドを選ぶには、マウスを使うかキーボードを使います。

ヒント：　殆どのショートカットは、Altを押しながらメニュー名の後のアルファベットを押して、コマンド名の後のアルファベットを押します。殆どの共通のコマンド（「開く」や「保存」、「終了」、「元に戻す」など）には使い慣れたMicrosoft Windowsのショートカットを使用できます。

メニュー	キーボードショートカット
ファイル
開く	Ctrl +O
保存	Ctrl +S
終了	Alt + X
編集
元に戻す	Ctrl +Z
表示
範囲調整	Ctrl +E
リフレッシュ	F5
プロパティウインドウ	Alt +Enter
設計
面の更新	F4
ショートカットメニュー
選択モード	F2


レポートの表示

DTMLink™ソフトウエアはレポートを生成します。（容積レポートやブレークライン交差レポートなど）

レポートは､C:\Trimble Geomatics Office\Projects\xx\Reports\DTMLink\yy の中に標準によって保管されます。xx はプロジェクト名、ｙｙ　は面の名前です。

後日そのレポートを見るには、このフォルダからMicrosoft Windows Explorer の中でそれを開きます。


フィールド記入

あらゆるグラフィックウインドウ（フローティングウインドウ　を含む）から「フィールド記入」を使用してダイアログのフィールドに値を入力します。例えば、「ポイントを外す」ダイアログで値を入力するには、面の上のポイントをクリックします。

フィールド記入をサポートするフィールドでは、グラフィックウインドウのポインターは以下のように示されます。

注：グラフィックウインドウ内で選択したエンティティが反転表示しているフィールドの必要とする値を提供できない場合には、　ダイアログ内のフィールドは影響を受けません。

コピーをする前に値をチェックしたりプレビューしたり位置を示したりするにはそれを押したままにします。マウスがドラッグされると、フィールドは値を表示し、ステータスバーはエンティティ概要を示します。マウスを解除すると値がコピーされます。

フィールドによっては値のグループとして記入されます。一回のクリックでグループ分けされた全フィールドへの記入を行うことができます。例えば、北距と東距フィールドは通常１つのグループを形成します。１つのフィールドだけに記入を行う場合にはそれを選択してAltを押してクリックします。

カーソルの働きはフィールド記入の後、次のフィールドへと移動します。

ヒント：

フィールド記入使用中にCtrlを押すとエンティティへと飛び移るのを防ぎ、座標だけが選ばれます。これによってエンティティに近い座標を選ぶことができます。

フィールド記入に必要な値を持つエンティティの位置を示すために表示メニューコマンド（例えば、ズームやパン）を使用できます。位置が示されたら、値をコピーする前にフィールドにフォーカスを戻す必要があります。


タイトルバー

タイトルバーは、スクリーンの一番上、メニューバーの上に横に延びています。


メニューバー

メニューバーはタイトルバーの下にあります。それには以下のメニューが含まれます。

ファイル

編集

表示

設計

ツール

ウインドウ

ヘルプ

コマンドの選択

メニューからコマンドを選択するには、それをマウスでクリックシステムします。

キーボードショートカット

メニューバーからアクセスできるあらゆるメニューコマンドをマウスを使って選ぶことができます。しかしキーボードを使って選ぶことも可能です。

キーボードを使用する場合には、希望するメニュー名の後に続く下線のついたアルファベットとAlt　を一緒に押します。そして希望するコマンド名の後に続く下線のついたアルファベットを押すか、上下する矢印を使って選択肢から選びEnterを押します。

ヒント：　殆どの共通のコマンド（「開く」や「保存」など）には使い慣れたMicrosoft Windowsのショートカットを使用できます。

関連事項


ステータスバー

ステータスバーは多様なメッセージを表示し、DTMLink™ソフトウエアの現在のステータスに関する即時で簡明なフィードバックを提供します。

ステータスバーはDTMLink ソフトウエアのメイングラフィックウインドウの一番下に表示されます。図１を参考にしてください。

図１　　ステータスバー

メッセージペイン

ステータスバーのメッセージペインはDTMLink ソフトウエアの操作に関する情報を示します。

このペインは反転表示されたメニュー項目の働きを記述します。例えば、ファイル　／　面を開くコマンドが反転表示されている時には「面を開きます」というメッセージが現れます。このペインは、反転表示されたツールバーボタンの働きを記述するメッセージも表示します。例えば、表示ツールバーのパンツールの上にカーソルを置くと、「ズームエリアの中心を移動します」というメッセージが現れます。

座標ペイン

マウスがグラフィックウインドウの中にある時には、関連のある座標が表示されます。

範囲ペイン

このペインはマウスが置かれているグラフィックウインドウの幅と高さを示します。

インディケータペイン

インディケータペインは、面に変更があり更新が必要な時には反転表示されます。追加のブレークラインや境界線が面に追加されると面の更新インディケータがこのペインに現れるので（上の図で示されたように）、面の更新が必要になります。

ウインドウコーナー

ウインドウコーナーではメイングラフィックウインドウのサイズ変更ができます。


ヒント

以下のトピックスを利用できます。

ツールバーの使用

ショートカットメニュー

ショートカットキー

レポートの表示

フィールド記入

タイトルバー

メニューバー

ステータスバー

標準ツールバー

表示ツールバー

面ツールバー


容積ﾚﾎﾟｰﾄ
ﾂｰﾙ/容積ﾚﾎﾟｰﾄ

現在の面で容積ﾚﾎﾟｰﾄを作成するためにこのｺﾏﾝﾄﾞを使用します。

ﾚﾎﾟｰﾄのﾀｲﾌﾟ

｢ﾚﾎﾟｰﾄのﾀｲﾌﾟ｣ﾎﾞｯｸｽから現在の面の容積ﾚﾎﾟｰﾄのﾀｲﾌﾟを選びます。

利用できる容積計算ﾀｲﾌﾟは以下の通りです。

標高の上

補給材料の山の算定のためには｢標高の上｣ｵﾌﾟｼｮﾝを使用します。

注:補給材料の山は水平ﾍﾞｰｽ上にあると仮定します。

２つの標高間

水平ﾚｲﾔｰの材料の容積を算出するために｢２つの標高間｣ｵﾌﾟｼｮﾝを使用します。

空間の容積

2つの特定標高間の｢空気｣の容積を算出するために｢空間の容積｣ｵﾌﾟｼｮﾝを使用します。別の言い方をすれば空間の容積とは､2つの特定ｺﾝﾀ標高間の容積です。それはｺﾝﾀ面ﾓﾃﾞﾙより下には含まれません。

標高の上限

標高の上限は､容積が算出されるべき標高の上限を定義します。このﾌｨｰﾙﾄﾞに表示される既定値はｺﾝﾀ面の最高ﾎﾟｲﾝﾄです。容積算出に標高の上限が必要な場合にこのﾌｨｰﾙﾄﾞが利用可能です。

ﾋﾝﾄ:ｺﾝﾀ面ﾓﾃﾞﾙの最大標高値を選択するには最高をｸﾘｯｸします。

標高の下限

標高の下限は､容積が算出されるべき標高の下限を定義します。このﾌｨｰﾙﾄﾞに表示される既定値はｺﾝﾀ面の最低ﾎﾟｲﾝﾄです。容積算出に標高の下限が必要な場合にこのﾌｨｰﾙﾄﾞが利用可能です。

ﾋﾝﾄ:ｺﾝﾀ面ﾓﾃﾞﾙの最小標高値を選択するには最低をｸﾘｯｸします

減量と増量

｢減量と増量｣ｵﾌﾟｼｮﾝは､ﾚﾎﾟｰﾄされた容積が材料の圧縮(減量)や拡張(増量)のために訂正されるかどうかを決定します。このｵﾌﾟｼｮﾝは減量と増量を相互関係付けます。

注:生の容積(減量や増量のない容積)に対しては､ﾊﾟｰｾﾝﾄﾌｨｰﾙﾄﾞにｾﾞﾛ値を入力します。

ﾊﾟｰｾﾝﾄ

ﾊﾟｰｾﾝﾄﾌｨｰﾙﾄﾞに実際の減量か増量率(ﾊﾟｰｾﾝﾄで表示)を入力します。

例えば､減量ｵﾌﾟｼｮﾝが選択され､ﾊﾟｰｾﾝﾄﾌｨｰﾙﾄﾞが10％の値を持つ場合にはDTMLink� ｿﾌﾄｳｴｱは生の容積よりも10％小さい容積をﾚﾎﾟｰﾄします。

つまり､600立方ﾒｰﾄﾙの生の容積で､減量ｵﾌﾟｼｮﾝが選択され､減量率が10％の場合には､DTMLink ｿﾌﾄｳｴｱは容積を540立方ﾒｰﾄﾙとﾚﾎﾟｰﾄします。


標高の上

｢標高の上｣ｵﾌﾟｼｮﾝは､特定の標高から上方のｺﾝﾀ面の最高ﾎﾟｲﾝﾄまでの容積を算出します。ﾃﾞｼﾞﾀﾙ地形ﾓﾃﾞﾙ(DTM)を形成する三角平面によって定義される各三角ﾌﾟﾘｽﾞﾑの容積が算出されます。

その方法は以下を算出します。

平面より上の容積(標高の下限は特定済)

平面面積

表面面積

図1は角錐台容積算出法を示します。

図1 角錐台容積算出法

ﾌﾟﾘｽﾞﾑの容積(Vp)は､ﾌﾟﾘｽﾞﾑ容積の方程式で計算します。

ここでは､

H1は第1ﾎﾟｲﾝﾄの標高です。

H2は第2ﾎﾟｲﾝﾄの標高です。

H3は第3ﾎﾟｲﾝﾄの標高です。

BEは下限ﾚﾍﾞﾙの標高です。

Pは表面面積です。

表面面積は､平面上に投影された面三角形の面積です。.

表面面積(P)は表面面積方程式で計算します。

ここでは､

はｸﾞﾘｯﾄﾞ座標から計算されたﾍﾞｰｽ三角形の長さです。

はｸﾞﾘｯﾄﾞ座標から計算されたﾍﾞｰｽ三角形の高さです。

各三角ﾌﾟﾘｽﾞﾑの容積は､個々に計算されてから､ﾓﾃﾞﾙの境界線区域内の合計容積を得るために合計されます。特定された標高の下限が三角形を切断する時､標高の下限より上にある､三角形の一部のﾌﾟﾘｽﾞﾑ容積が計算されます。

その他の参照事項


標高の上の容積計算例

ある標高より上の容積計算法は一般的に､埋立地やその他同様の区域の規則的充填を監視するのに適用されます。必要な手順は以下の通りです。

手順1　興味のある区域に対する一般的な境界線を定義します。図1参照。

図1  盛土ｱﾌﾟﾘｹｰｼｮﾝ全域

手順2　外枠境界線を使用して全域を覆うｺﾝﾀﾓﾃﾞﾙの原型を必要な形に仕上げます。ｺﾝﾀﾃﾞｰﾀは少なくともこの定義された外枠境界線まで延長されなければなりません。図2参照。

図 2  面ﾓﾃﾞﾙ原型の一部

手順3　定義された標高の下限と元来のｺﾝﾀ面との間の容積を算出します。図3参照。

図 3  元来の面より下の容積

手順 4　盛土区域を定義するﾎﾟｲﾝﾄを使用する第2のｺﾝﾀ面を形成します。元来の外枠境界線定義を使用してこの新しいｺﾝﾀﾓﾃﾞﾙを必要な形に仕上げます。ここでもｺﾝﾀﾃﾞｰﾀは少なくともこの境界線まで延長されなければなりません。図 4参照

図 4  新しいｺﾝﾀﾓﾃﾞﾙ

手順5　最初の面に対して使用されたのと同じ標高の下限と､新しい面の間の容積を算出します。図5参照

図5  新しい面より下の容積

手順6　新しい面より下の容積から､元来の面より下の容積(図6の3参照)を算出します。

図6  算出された容積

その他の参照事項


２つの標高間

｢２つの標高間｣ｵﾌﾟｼｮﾝでは､標高の上限と下限の間の容積を算出できます。それと同じ容積算出法は､｢標高の上｣方法で示されたように､角錐台容積算出法を使用します。

｢２つの標高間｣ｵﾌﾟｼｮﾝは､2つの特定されたｺﾝﾀ標高間の選択されたｺﾝﾀﾓﾃﾞﾙの容積の算出に使用されます。

図1 は算出される２つの標高間の容積を示します。

図1  ２つの標高間の容積

標高の上限

図1は上限標高より上の容積を含んでいます。この標高より上の容積は必要ありません。このﾌｨｰﾙﾄﾞの既定値は､ｺﾝﾀ面の最高ﾎﾟｲﾝﾄです。

標高の上限ﾌｨｰﾙﾄﾞにそれ以下の容積が算出されるべき標高を入力します。

標高の下限

上の図は下限標高より上の容積を含んでいます。標高の下限は､それより下の容積は必要とされない標高を定義します。このﾌｨｰﾙﾄﾞの既定値は､ｺﾝﾀ面の最低ﾎﾟｲﾝﾄです。

標高の下限ﾌｨｰﾙﾄﾞにそれ以上の容積が算出されるべき標高を入力します。


空間の容積

このｵﾌﾟｼｮﾝは､2つの特定標高間の｢空気｣の容積を算出するために使用されます。別の言い方をすれば空間の容積とは､2つの特定ｺﾝﾀ標高間の容積で､ｺﾝﾀﾓﾃﾞﾙ面より下は含まれません。

｢空間の容積｣ｵﾌﾟｼｮﾝを使用するには､ﾓﾃﾞﾙの一番下より下の標高の下限と､土盛りをしたい水平面を定義する標高の上限を特定します。図8参照。

図8  空間の容積の算出

標高の下限より上の容積は､その標高より上の合計容積です。（標高の上限より上の容積を含みます。）

空間の容積は以下の式を使用して算出されます。

空間の容積=BA x (UE 烹E)�(BV 剖V)

ここでは､

BAは標高の下限より上の平面面積です。

UEは標高の上限です。

BEは標高の下限です。

BVは標高の下限より上の容積です。

UVは標高の上限より上の容積です。

標高の上限

図8は､標高の上限が空間の容積の一番上を定義することを示します。このﾌｨｰﾙﾄﾞに示された既定値はｺﾝﾀ面の最高ﾎﾟｲﾝﾄです。

標高の下限

図8 は､標高の下限が空間の容積の一番下を定義することを示します。このﾌｨｰﾙﾄﾞに示された既定値はｺﾝﾀ面の最低ﾎﾟｲﾝﾄです。

その他の参照事項


空間の容積例

｢空間の容積｣法は､一般的には､建設計画中のﾀﾞﾑの背後に蓄えられる水の容積を算出する時に使用されます。

水の容積の算出手順は以下の通りです。

手順1　建設計画中のﾀﾞﾑの背後にある地面を定義するﾃﾞｰﾀを使用するｺﾝﾀﾓﾃﾞﾙを形成します。ｺﾝﾀﾓﾃﾞﾙを形成する時には外枠境界線を定義します。外枠境界線は､ﾀﾞﾑの背後の水を含有するであろう区域にｺﾝﾀﾓﾃﾞﾙを制限します。外枠境界線は建設計画中のﾀﾞﾑの面に沿って定義されなければなりません。これは､算出された容積がﾀﾞﾑの背後のものであることを確実にします。

手順 2　要求される水のﾚﾍﾞﾙを標高の上限として特定し､空間の容積を算出します。

図 1 は､空間の容積算出が行われるであろう区域の例を示しています。算出された空間の容積を示す､ﾀﾞﾑの頂を通る横断面の例も一緒に示されます。

空間の容積算出の結果は､特定された標高の下限（ﾀﾞﾑの背後の一番深いﾎﾟｲﾝﾄよりも低くなるように選択されていなければなりません。）と標高の上限（水面ﾚﾍﾞﾙ）間の水の容積を与えてくれます。この空間の容積は､事実上､面の上､しかし特定された水のﾚﾍﾞﾙよりは下にある水によって満たされる容積であり､それゆえに必要とされる容積でもあります。図1参照。

図 1 : 例

その他の参照事項


面の再構築
ﾂｰﾙ/面の再構築

元来の面ﾎﾟｲﾝﾄから面を再構築するにはこのｺﾏﾝﾄﾞを使用します。ｺﾝﾀ面ﾓﾃﾞﾙから削除されたあらゆる面ﾎﾟｲﾝﾄや三角形を復元することができます。このｺﾏﾝﾄﾞは､元来の面ﾎﾟｲﾝﾄのｲﾝﾎﾟｰﾄ後に作成された境界線やﾌﾞﾚｰｸﾗｲﾝを使用します。

忠告:交換されたり削除されたりした三角形は､面の再構築後に保持されません。除外されたﾎﾟｲﾝﾄは面の再構築後元の状態に戻ります。


面の比較
ﾂｰﾙ/面の比較

｢面の比較｣ｵﾌﾟｼｮﾝは､2つの選択された面を向かい合わせた比較を生成します。結果として生じる比較面は､大きい方の面とﾍﾞｰｽの面間の標高差のｺﾝﾀ面を提供します。比較面を使用して2つの面の間の容積を算出することができます。

その他の参照事項

大きい方の面

ﾄﾞﾛｯﾌﾟﾀﾞｳﾝﾘｽﾄから､必要な大きい方の面を選択します。必要に応じたﾌｫﾙﾀﾞを選択するために｢ﾌｫﾙﾀﾞ｣ﾌｨｰﾙﾄﾞを使用します。

その他の参照事項

ﾍﾞｰｽの面

ﾄﾞﾛｯﾌﾟﾀﾞｳﾝﾘｽﾄから必要なﾍﾞｰｽの面を選択します。必要に応じたﾌｫﾙﾀﾞを選択するために｢ﾌｫﾙﾀﾞ｣ﾌｨｰﾙﾄﾞを使用します。

その他の参照事項

新しい面

比較面の名前を入力します。その名前は現在のﾌﾟﾛｼﾞｪｸﾄで他と同一であることはできません。

比較方法

比較方法を選択します。以下から選んでください。

簡単

詳細

その他の参照事項


2面間の容積算出

｢空間の容積｣ｵﾌﾟｼｮﾝを使用すると､比較面を使用して2面間の盛土と切土の容積を算出することができます。標高の下限はｺﾝﾀﾓﾃﾞﾙの最低ﾎﾟｲﾝﾄに設定され､標高の上限はｾﾞﾛに設定されます。ｾﾞﾛｺﾝﾀﾗｲﾝは､切土区域から盛土区域へと変わる場所を示します。これは､標高の上限より上の算出された容積は全盛土区域の容積の合計であることを意味します。全切土区域の容積の合計は､標高の下限と上限間の空間の容積に応じます。

盛土か切土の特定区域の容積が必要な場合､個々の容積が必要とされる区域周辺の外枠境界線を定義することでそれを得ることができます。ﾓﾃﾞﾙはその後再形成され､標高の下限が再びｺﾝﾀﾓﾃﾞﾙの最低ﾎﾟｲﾝﾄに､標高の上限がｾﾞﾛに設定されることで､｢空間の容積｣ｵﾌﾟｼｮﾝがこのﾓﾃﾞﾙで使用されます。関連区域が切土区域である場合には､算出された切土容積は標高の下限と上限間の空間の容積です。

その他の参照事項


大きい方の面とﾍﾞｰｽの面

大きい方の面とﾍﾞｰｽの面の選択は､標高差の方向を定義します。

ﾍﾞｰｽの面上の対応区域より高い､大きい方の面上のあらゆる区域は､ﾌﾟﾗｽ標高の区域として示されます。

ﾍﾞｰｽの面より低い大きい方の面上のあらゆる区域は､ﾏｲﾅｽ標高の区域として示されます。両方の面に共通しない区域は､比較面上には現れません。


比較方法

比較方法を選択します。

単純

これは､点と面の両方向の比較です。大きい方の面とﾍﾞｰｽの面上の全ﾎﾟｲﾝﾄはその他の面に投影され､標高差が計算されます。この標高差と座標位置が､比較面に対するﾓﾃﾞﾙ座標を形成します。ｺﾝﾀされる時､比較面は比較面間の切土盛土関係を象徴します。図1参照。

図 1 : 単純面比較

詳細

詳細比較は最初簡単比較と同じ手順で進められます。追加として詳細比較は､水平平面の一面の三角辺と別の面の三角辺との交差毎に比較座標を形成します。この方法を使用することで､最大量の情報を2つのﾓｼﾞｭｰﾙから得ることができます。結果として得られる比較面は2面の三角形形成（と､それゆえにそのﾌﾞﾚｰｸﾗｲﾝ情報）を使用するので更に詳細なものとなります。詳細法は簡単法より長い時間が掛かります。図2参照。

図 2 : 詳細面比較

注: 大きい方の面とﾍﾞｰｽの面両方のﾌﾞﾚｰｸﾗｲﾝと境界線のすべては､比較面の処理時には無視されます。境界線が必要な場合には､比較作業の後に追加しなければならず､その後比較面の更新が必要です。比較面上のﾌﾞﾚｰｸﾗｲﾝを定義することはできません。｢ﾗｲﾝの追加｣を使用すると､比較面更新にﾌﾞﾚｰｸﾗｲﾝを含めることができますが､結果は不正確で意味の無いものです。これは､ﾃﾞｰﾀﾍﾞｰｽﾎﾟｲﾝﾄ間の差異である標高を持つ面ﾎﾟｲﾝﾄを基に比較面が作られ､ﾌﾞﾚｰｸﾗｲﾝはﾃﾞｰﾀﾍﾞｰｽﾎﾟｲﾝﾄと一緒にしか定義されないからです。


ﾂｰﾙﾒﾆｭｰ

計算を行い､ﾃﾞｰﾀを操作するためにはﾂｰﾙﾒﾆｭｰを使用します。それには以下のｺﾏﾝﾄﾞがあります。

容積ﾚﾎﾟｰﾄ

面の再構築

面の比較


拡大
表示 / 拡大

	表示ツールバー上の「拡大」ツールをクリックします。
グラフィックウインドウのセクションを入念に検査するためにこのツールを使用します。

「拡大」ツールを選択します。

1.	グラフィックウインドウ上にポインターを移動します。　プラスのマークが中にある拡大鏡ポインターが現れます。拡大鏡ポインターの上の十字線が該当場所に印を付けます。

2.	以下の１つを行います。

該当場所を中心に2倍に拡大するためにグラフィックウインドウ上のある位置をクリックします。

拡大したい区域を含む長方形を作成するために、クリックしたままグラフィックウインドウを横切ってポインターをドラッグします。　区域が小さいほど縮尺は大きくなります。マウスボタンが解放されると長方形の中に含まれる区域の内容が、グラフィックウインドウ全体を占有するようになります。

注：

「拡大」ツールの現在の作業を取消すためには左マウスボタンを押す一方でEscを押します。

ズーム区域のフローティングウインドウ　を呼び出すズーム操作を行うには､Shift を押し続けます。


縮小
表示 / 縮小

	表示ツールバー上の「縮小」ツールをクリックします。
グラフィックウインドウ上で更に大きい区域を表示させるためにこのツールを使用します。

「縮小」ツールを選択します。

１．グラフィックウインドウ上にポインターを移動します。　マイナスのマークが中にある拡大鏡ポインターが現れます。拡大鏡ポインターの上の十字線が該当場所に印を付けます。

２．	以下の１つを行います。

グラフィックウインドウ上のある位置をクリックします。グラフィックウインドウの縮尺が変更され、該当場所の位置が中心になります。

必要区域を含む長方形を作成するために、クリックしたままグラフィックウインドウを横切ってポインターをドラッグし、その後解放します。グラフィックウインドウの縮尺が変更し、以前はグラフィックウインドウに含まれた区域が長方形の中に表示されます。縮小を放棄するには、マウスボタンを解放せずにドラッグを始めたポイントに戻ります。

注：

「縮小」ツール　の現在の作業を取消すためには左マウスボタンを押す一方でEscを押します。

グラフィックウインドウ上の長方形をクリックしながらドラッグします。縮小操作が行われると、　以前の表示は長方形の中に含まれるようになります。長方形が小さいほど縮尺変動が大きくなります。


パン
表示 / パン

	表示ツールバー上の「パン」ツールをクリックします。
スクリーン表示の異なる区域を表示するためにグラフィックウインドウの内容物を移動する時このツールを使用します。

「パン」ツールを選択します。

１．	グラフィックウインドウ上にポインターを移動します。　ハンドポインターが現れます。ハンドポインターの上の十字線が該当場所に印を付けます。

２．以下の１つを行います。

グラフィックウインドウ上のある位置をクリックします。その位置がウインドウの新しい中心となります。

パンしたい距離と方向にハンドポインターをクリックしたままドラッグします。スクリーンが移動しようとしている距離と方向を示すためにラインが現れます。ボタンを解放します。スクリーン表示がこの新しい場所に移動します。パンを放棄するにはマウスボタンを解放せずにドラッグを始めたポイントにハンドポインターを戻します。

注：　「パン」ツール　の現在の作業を取消すためには左マウスボタンを押す一方でEscを押します。


選択へパン
表示/選択へパン

グラフィックウインドウ上の特定の場所にパンして縮尺されます。

「選択へパン」ダイアログを開きます。

表示の中心

このフィールドグループでは、表示の中心となる場所や名前を特定するためにフィールド記入を行います。

ポイント名	表示の中心となるべきポイントのポイント名を入力するためにこのフィールドを使用します。北距と東距フィールドは自動的に更新されます。
東距・北距	ポイント名がわからない時に、表示の中心を入力するためにこのフィールドを使用します
放射状に表示

「放射状に表示」フィールドは現在の表示場所に設定されます。

スクリーンの中心は、　グラフィックウインドウの方位に従って、特定した半径の距離だけ移動します。図1参照。

図1 : スクリーン上の方位


全体表示
表示 / 全体表示

	表示ツールバー上の　「全体表示」ツールをクリックします。
現在の面の可視ポイントすべてを表示するにはこのコマンドを使用します。

「全体表示」コマンドを選択すると、　グラフィックウインドウはすべてのデータを見ることができるように自動的に調整します。


前のズーム
表示 / 前のズーム

	表示ツールバー上の「前のズーム」ツールをクリックします。
前の表示へと１つ１つ戻るためにこのコマンドを使用します。


フローティングウインドウ
表示/フローティングウインドウ

	表示ツールバー上の　「フローティングウインドウ」ツールをクリックします。

フローティングウインドウを表示するためにこのコマンドを使用します。フローティングウインドウは開いている時には常に一番上にあります。

フローティングウインドウは別の表示を提供します。他のグラフィックウインドウと同様に、フローティングウインドウ内でフィールド記入や選択、ズームを使用できます。

これは、例として、グラフィックウインドウの鳥瞰表示を提供するツールとしてフローティングウインドウを使用できることを意味します。どちらのウインドウも通常の操作に使用することができます。（フィールド記入や選択、ズームなど）

注：　表示　/　全体表示はグラフィックウインドウ内で操作されます。フローティングウインドウで表示　/　全体表示を行いたい場合には、　ショートカットメニューをクリックします。

フローティングウインドウ内で表示を拡大するには、「拡大」ツールを選択し､Shiftキーを押し続けながら「拡大」ツールをドラッグすることで拡大したい区域をグラフィックウインドウ内で特定します。

グラフィックウインドウ内で表示を拡大するには、「拡大」ツールを選択し、Shiftキーを押し続けながらズームを始めるポイントをグラフィックウインドウ内で選択することで表示する区域をフローティングウインドウ内で特定します。これはフローティングウインドウがどのように鳥瞰表示として使用されるのかを示します。

注：　フローティングウインドウツールバーは、関連するグラフィックウインドウが作業中の時には作業中とされます。


ツールバー
表示/ツールバー

ツールバーのどれかを表示したり隠したりするためにこのコマンドを使用します。

各ツールバーはボタンによって象徴される一連のツールです。すべてのツールはメニューコマンドとして利用できます。

ツールバー

各ツールバーを表示したり隠したりするためにチェックボックスを選択します。チェックマークはそれが表示されることを意味します。

閉じる

ダイアログを終了するためには「閉じる」をクリックします。

すべて

ツールバーのすべてを表示するには「すべて」をクリックします。

なし

ツールバーのすべてを隠すためには「無し」をクリックします。

リセット

ツールバーを標準設定に戻すためには「リセット」をクリックします。

関連事項


レイヤー
表示 / レイヤー

	表示ツールバー上の「レイヤー表示」ツールを使用します。

現在の表示でレイヤーを表示したり隠したりするためにこのコマンドを使用します。

特定のレイヤーを表示したり隠したりすると、DTMLink™ソフトウエアはその中のエンティティを表示したり隠したりします。

注：　DTMLinkソフトウエアでレイヤーを表示したり隠したりすることは、AutoCAD　でレイヤーをオンにしたりオフにしたりするのに似ています。ブレークラインレイヤーをオフにしても、それが面の更新に使用されないようになる訳ではありません。面モデルには影響を与えません。影響を受けるのは表示だけです。

レイヤー

レイヤー一覧は、面内の全レイヤーの名前を表示します。チェックマークはそのレイヤーが表示されることを意味します。特定のレイヤーをオンにしたりオフにしたりするためにチェックボックスを選択します。

すべて

一覧内の全レイヤーを表示するには「すべて」をクリックします。

無し

一覧内の全レイヤーを隠すためには「なし」をクリックします。

ヒント：　全レイヤーの表示がオフの時には、エンティティはスクリーン上に表示されません。

注：　レイヤーがオフになっている時には、インディケータペインのレイヤーインディケータが反転表示されます。


再表示
表示 / 再表示

スクリーンを再表示するためにこのコマンドを使用します。

グラフィックウインドウが上書きされて読みにくくなった時に、プランビューを再描写するためにはこのコマンドを使用します。（またはF5を押します。）


オプション
表示 / オプション

グラフィックウインドウにコンタと三角形がどのように表示されるかを調整するためにこのコマンドを使用します。

以下を行うことができます。

　　コンタと三角形の表示を見せたり隠したりする

　　広い方と狭い方のコンタ間隔を変更する

　　コンタと三角形の色を編集する

　　コンタと三角形のラインタイプを編集する

　　コンタを描く方法を編集する

オプションダイアログのタブは、DTMLink™ソフトウエアで変更できる設定を表示します。

そのタブとは以下の通りです。

ラインオプション

詳細設定


ラインオプション

グラフィックウインドウでコンタと三角形がどのように表示されるのかを特定するためには、オプションダイアログのラインオプションタブを使用します。

コンタの表示

コンタに対してラインオプションを設定するために「コンタの表示」グループを使用します。グラフィックウインドウにコンタを表示するためには「コンタの表示」チェックボックスをオンにします。コンタを隠すためには「コンタの表示」チェックボックスをオフにします。

間隔	広い方と狭い方のコンタに間隔を設定します。
ヒント：　広い方と狭い方の間隔を表示するために異なる色を使用します。これによって標高の変化を即座に見て知ることができます。
このフィールドで特定される単位は、Trimble Geomatics Office™ソフトウエアで設定された単位です。
広い方の間隔よりも大きい値を狭い方の間隔に設定することはできません。広い方の間隔は、狭い方の間隔の倍数でなければなりません。．

プラスの色	ゼロ以上であるコンタの表示色を設定します。一覧から色を選択します。
広い方と狭い方の間隔を表示するために異なる色を使用します。これによって標高の変化を即座に見て知ることができます。

マイナスの色	ゼロ以下であるコンタの表示色を設定します。一覧から色を選択します。

広い方と狭い方の間隔を表示するために異なる色を使用します。これによって標高の変化を即座に見て知ることができます。

ラインタイプ	一覧からラインタイプを選びます。

三角形の表示

三角形に対するラインオプションを設定するために「三角形の表示」グループを使用します。グラフィックウインドウに三角形を表示するためには「三角形の表示」チェックボックスをオンにします。三角形を隠すためには「三角形の表示」チェックボックスをオフにします。

色	このフィールドは三角形の表示色を設定します。一覧から色を選択します。この色は三角形の辺を表示します。

ラインタイプ	一覧からラインタイプを選びます。

適用

変更を適用しオプションダイアログを開いたままにするためには適用をクリックします。

ＯＫ

変更を適用しダイアログを終了するためにOKをクリックします。


詳細設定オプション

連続するコンタとそれがグラフィックウインドウでどのように表示されるのかを定義するためにオプションダイアログの詳細設定タブを使用します。

コンタをラインとして描く

モデル内の各三角形間に直線を表示するために「コンタをラインとして描く」オプションを選択します。

コンタを曲線として描く

モデル内の各三角形間により現実的なコンタを表示するために「コンタを曲線として描く」オプションを選択します。

その曲線がどれほど真直ぐであるかを特定するために曲線の緩急スライダを使用します。スライダを最大の曲線緩急に設定すると直線が作成されます。スライダの既定位置は違和感のない曲線を通常作成します。

ヒント：　曲線を滑らかにするために、あるコンタが別のコンタと交差したというような例外的な状態を制御するためにスライダを使用します。

すべてのコンタを表示

面上のすべてのコンタを表示するためには「すべてのコンタを表示」オプションを選択します。

指定の標高間のコンタを表示

特定された標高範囲内のすべてのコンタを表示するためには「指定の標高間のコンタを表示」オプションを選択します。

最低の標高	表示されるべきコンタの最低標高を「最低の標高」フィールドに入力します。既定として現れる値は、モデルに記録された最低ポイントです。

ヒント：　最高の標高値を選択するには最高をクリックします。

最高の標高	表示されるべきコンタの最高標高を「最高の標高」フィールドに入力します。既定として現れる値は、モデルに記録された最高ポイントです。

ヒント：　最低の標高値を選択するには最低をクリックします。

適用

変更を適用しオプションダイアログを開いたままにするためには適用をクリックします。

ＯＫ

変更を適用しダイアログを終了するためにOKをクリックします。


プロパティ
表示/プロパティ

	標準ツールバー上の「プロパティ」ツールをクリックします。

各要素のプロパティを表示するにはプロパティウインドウ　を使用します。

注：　プロパティウインドウ内のエンティティを編集することはできません。要素を編集するには、Trimble Geomatics Office™　ソフトウエアに戻り、エンティティを編集するためにプロパティウインドウを使用します。編集されたエンティティを使用して新しい面を作成します。

プロパティウインドウは選択したエンティティの名前と適切値を表示します。

ヒント：プロパティウインドウのサイズを変更するには、ウインドウフレームをクリックしてドラッグします。　ウインドウ内の分割のサイズを変更するには、分割バーをクリックしてドラッグします。


プロパティウィンドウ
プロパティウインドウ

プロパティウインドウは各要素のプログラムを表示してくれます。プロパティを編集することはできません。それは要素の適切な名前と値を表示します。

注：　同時に選択できる要素は１つだけです。


表示ﾒﾆｭｰ
表示メニュー

表示メニューは、グラフィックウインドウでコンタ面の表示を制御し管理するためのコマンドを提供します。以下のコマンドを利用できます。

拡大

縮小

パン

選択へパン

全体表示

前のズーム

フローティングウインドウ

ツールバー

レイヤー

再表示

オプション

プロパティ


新しいｳｲﾝﾄﾞｳ
ｳｲﾝﾄﾞｳ/新しいｳｲﾝﾄﾞｳ

現在の面に対して別のｳｲﾝﾄﾞｳを開くためにはこのｺﾏﾝﾄﾞを使用します。

作業中のｳｲﾝﾄﾞｳと同じ内容を持つ新しいｳｲﾝﾄﾞｳを開くためにはこのｺﾏﾝﾄﾞを使用します。異なる部分や表示を表示するために複数のｳｲﾝﾄﾞｳを開くことができます。1つのｳｲﾝﾄﾞｳで内容を変更すると､その他のすべてのｳｲﾝﾄﾞｳもその変更の影響を受けます。新しいｳｲﾝﾄﾞｳを開くと､それが作業中のｳｲﾝﾄﾞｳとなり､その他のすべての開いているｳｲﾝﾄﾞｳの一番上に表示されます。


重ねて表示
ｳｲﾝﾄﾞｳ/重ねて表示

ﾃﾞｽｸﾄｯﾌﾟ上のﾀﾞｲｱﾛｸﾞと開いたｳｲﾝﾄﾞｳのｻｲｽﾞを変更し､左上から右下へと重なるようにそれを配置するためには､このｺﾏﾝﾄﾞを使用します。

ｳｲﾝﾄﾞｳを重ねて表示すると､ｳｲﾝﾄﾞｳは層を成すので､ﾃﾞｽｸﾄｯﾌﾟですべてのｳｲﾝﾄﾞｳのｳｲﾝﾄﾞｳﾀｲﾄﾙﾊﾞｰを見ることができます。


並べて表示
ｳｲﾝﾄﾞｳ/並べて表示

ﾃﾞｽｸﾄｯﾌﾟ上のﾀﾞｲｱﾛｸﾞと開いたｳｲﾝﾄﾞｳを移動してｻｲｽﾞを変更し､並べて表示されるように配置するためには､このｺﾏﾝﾄﾞを使用します。


ｱｲｺﾝの整列
ｳｲﾝﾄﾞｳ/ ｱｲｺﾝの整列

最小化されたｳｲﾝﾄﾞｳのあらゆるｱｲｺﾝをｽｸﾘｰﾝ上で系統だった状態に並び替えるためにこのｺﾏﾝﾄﾞを使用します。これはｳｲﾝﾄﾞｳの一番下にｱｲｺﾝを配置します。.


ｳｲﾝﾄﾞｳの一覧
ｳｲﾝﾄﾞｳ/ ｳｲﾝﾄﾞｳの一覧

ﾃﾞｽｸﾄｯﾌﾟ上に現在開いているｳｲﾝﾄﾞｳの一覧を表示するためにこのﾒﾆｭｰの一番下のｾｸｼｮﾝを使用します。作業中のｳｲﾝﾄﾞｳにはﾁｪｯｸﾏｰｸが付きます。

別のｳｲﾝﾄﾞｳやﾀﾞｲｱﾛｸﾞを作業中にするにはその名前をｸﾘｯｸします。


ｳｲﾝﾄﾞｳﾒﾆｭｰ

ｳｲﾝﾄﾞｳﾒﾆｭｰは表示ｵﾌﾟｼｮﾝに対するｺﾏﾝﾄﾞを含みます。それには以下のｺﾏﾝﾄﾞがあります。

新しいｳｲﾝﾄﾞｳ

重ねて表示

並べて表示

ｱｲｺﾝの整列

ｽｸﾘｰﾝ上のｳｲﾝﾄﾞｳ一覧


境界線交差

交差する境界線がある時には､次のﾒｯｾｰｼﾞが現れます。

「交差する境界線がありました。ﾚﾎﾟｰﾄを表示しますか?」

ﾚﾎﾟｰﾄを表示するには｢はい｣をｸﾘｯｸします。

境界線交差ﾚﾎﾟｰﾄは交差する2つのﾗｲﾝを示します。それは､ﾎﾟｲﾝﾄ名とﾗｲﾝ開始時の北距と東距座標､ﾗｲﾝ終了時の北距と東距座標を使用して交差するﾗｲﾝを表現します。

境界線交差ﾚﾎﾟｰﾄの形式は次の例を参照してください。

境界線交差ﾚﾎﾟｰﾄ

ﾌﾟﾛｼﾞｪｸﾄDTMLink 指導書

ﾌﾟﾛｼﾞｪｸﾄ名	DTMLink 指導書
面	面1
単位	ﾒｰﾄﾙ
印刷日	29/07/99 11:56am
探知された境界線交差

　ﾎﾟｲﾝﾄ北距東距　　　　標高

ﾗｲﾝ	開始187     4408.302     2482.427      119.708

終了179     4430.895     2442.447      119.694   交差

ﾗｲﾝ	開始181     4443.678     2465.296      119.722

終了187     4408.302     2482.427      119.708

ﾚﾎﾟｰﾄはﾚﾎﾟｰﾄﾌｫﾙﾀﾞ(C:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\ﾚﾎﾟｰﾄ\DTMLink\yy )に保管されます。xx はﾌﾟﾛｼﾞｪｸﾄ名でyy は面名です。

後日このﾌｫﾙﾀﾞからMicrosoft Windows Explorerでそのﾚﾎﾟｰﾄを開いて見ることができます。


ﾌﾞﾚｰｸﾗｲﾝ交差

交差するﾌﾞﾚｰｸﾗｲﾝがある時には､次のﾒｯｾｰｼﾞが現れます。

「交差するﾌﾞﾚｰｸﾗｲﾝがありました。ﾚﾎﾟｰﾄを表示しますか?」

ﾚﾎﾟｰﾄを表示するには｢はい｣をｸﾘｯｸします。

ﾌﾞﾚｰｸﾗｲﾝ交差ﾚﾎﾟｰﾄは交差する2つのﾗｲﾝを示します。それは､ﾎﾟｲﾝﾄ名とﾗｲﾝ開始時の北距と東距座標､ﾗｲﾝ終了時の北距と東距座標を使用して交差するﾗｲﾝを表現します。

ﾌﾞﾚｰｸﾗｲﾝ交差ﾚﾎﾟｰﾄの形式は次の例を参照してください。

ﾌﾞﾚｰｸﾗｲﾝ交差ﾚﾎﾟｰﾄ

ﾌﾟﾛｼﾞｪｸﾄDTMLink指導書

ﾌﾟﾛｼﾞｪｸﾄ名	DTMLink 指導書
面	面1
単位	ﾒｰﾄﾙ
印刷日	28/07/99 3:23pm
探知された境界線交差

　ﾎﾟｲﾝﾄ北距東距　　　　標高

ﾗｲﾝ	開始38     4456.360     2461.687      110.358

終了187     4408.302     2482.427      119.708   交差

ﾗｲﾝ	開始182     4447.684     2476.296      120.100

終了181     4443.678     2465.296      119.722

ﾗｲﾝ	開始190     4411.104     2461.389      118.697

終了183     4442.452     2486.146      120.193   交差

ﾗｲﾝ	開始38     4456.360     2461.687      110.358

終了187     4408.302     2482.427      119.708

ﾚﾎﾟｰﾄはﾚﾎﾟｰﾄﾌｫﾙﾀﾞ(C:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\ﾚﾎﾟｰﾄ\DTMLink\yy )に保管されます。xx はﾌﾟﾛｼﾞｪｸﾄ名でyy は面の名です。

後日このﾌｫﾙﾀﾞからMicrosoft Windows Explorerでそのﾚﾎﾟｰﾄを開いて見ることができます。


調整した座標

ﾌﾞﾚｰｸﾗｲﾝが面ﾎﾟｲﾝﾄの非常に近くを通る場合には､その近くのﾎﾟｲﾝﾄの高度はﾌﾞﾚｰｸﾗｲﾝから補間された高度値に修正されます。これは､例外的なｺﾝﾀが近くのﾎﾟｲﾝﾄからﾌﾞﾚｰｸﾗｲﾝを強要されるのを防ぐためです。

このﾎﾟｲﾝﾄを調整して欲しくない場合には､北距と東距を変更することでそのﾎﾟｲﾝﾄをﾌﾞﾚｰｸﾗｲﾝから少しずらすことができます。

DTMLinkｼｽﾃﾑが座標を調整すると､次のﾒｯｾｰｼﾞが現れます。

「座標ﾎﾟｲﾝﾄが調整されました。ﾚﾎﾟｰﾄを表示しますか?」

ﾚﾎﾟｰﾄを表示するには｢はい｣をｸﾘｯｸします。

調整した座標ﾚﾎﾟｰﾄは､調整されたﾎﾟｲﾝﾄの座標詳細と修正された座標詳細を示します。

調整した座標ﾚﾎﾟｰﾄの形式は次の例を参照してください。

調整した座標ﾚﾎﾟｰﾄ

ﾌﾟﾛｼﾞｪｸﾄDTMLink指導書

ﾌﾟﾛｼﾞｪｸﾄ名	DTMLink 指導書
面	面1
単位	ﾒｰﾄﾙ
印刷日	28/07/99 2:37pm
調整した座標

調整された座標ﾎﾟｲﾝﾄ

保管されたﾌﾞﾚｰｸﾗｲﾝ標高に調節された標高

ﾎﾟｲﾝﾄ北距東距標高

座標詳細:	2453       4573.147       5734.531      23.000

修正された座標詳細:	2453       4573.147       5734.531      53.798

ﾚﾎﾟｰﾄはﾚﾎﾟｰﾄﾌｫﾙﾀﾞ(C:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\ﾚﾎﾟｰﾄ\DTMLink\yy )に保管されます。xx はﾌﾟﾛｼﾞｪｸﾄ名でyy は面の名です。

後日このﾌｫﾙﾀﾞからMicrosoft Windows Explorerでそのﾚﾎﾟｰﾄを開いて見ることができます。


重複ﾎﾟｲﾝﾄ

ｺﾝﾀ面が作成されている間､すべてのﾎﾟｲﾝﾄは北距と東距座標が重複しないかﾁｪｯｸされます。重複するﾎﾟｲﾝﾄが発見された場合には､DTMLink™ｿﾌﾄｳｴｱは一番最近のﾎﾟｲﾝﾄを保持し､他のﾎﾟｲﾝﾄを放棄します。

重複ﾎﾟｲﾝﾄﾚﾎﾟｰﾄの例は以下の通りです。

重複ﾎﾟｲﾝﾄﾚﾎﾟｰﾄ

ﾌﾟﾛｼﾞｪｸﾄDTMLink指導書

ﾌﾟﾛｼﾞｪｸﾄ名	DTMLink 指導書
面	面1
単位	ﾒｰﾄﾙ
印刷日	28/07/99 4:02pm
読込まれる重複ﾎﾟｲﾝﾄ

　ﾎﾟｲﾝﾄ北距東距　　　　標高

保持されたﾎﾟｲﾝﾄ:55138       4452.923       2487.237         55.912

放棄されたﾎﾟｲﾝﾄ:138       4452.923       2487.237        116.912

保持されたﾎﾟｲﾝﾄ:1877       4408.302       2482.427         19.708

放棄されたﾎﾟｲﾝﾄ:187       4408.302       2482.427        119.708

ﾚﾎﾟｰﾄはﾚﾎﾟｰﾄﾌｫﾙﾀﾞ(C:\Trimble Geomatics Office\ﾌﾟﾛｼﾞｪｸﾄ\xx\ﾚﾎﾟｰﾄ\DTMLink\yy )に保管されます。xx はﾌﾟﾛｼﾞｪｸﾄ名でyy は面の名です。

後日このﾌｫﾙﾀﾞからMicrosoft Windows Explorerでそのﾚﾎﾟｰﾄを開いて見ることができます。

注:DTMLinkｿﾌﾄｳｴｱは垂直面をｻﾎﾟｰﾄしません。


曲線許容誤差

曲線と円弧は境界線とﾌﾞﾚｰｸﾗｲﾝを定義することができます。

曲線か円弧であるﾌﾞﾚｰｸﾗｲﾝと境界線との三角形算出を許容するために､曲線か円弧は一連の小さなﾗｲﾝｾｸﾞﾒﾝﾄとして象徴されます。

ﾗｲﾝｾｸﾞﾒﾝﾄの長さは曲線許容誤差によって制御されます。曲線許容誤差は､ﾗｲﾝｾｸﾞﾒﾝﾄへの垂直面で､一連のﾗｲﾝｾｸﾞﾒﾝﾄに沿ったあらゆるﾎﾟｲﾝﾄから曲線と円弧までの最大許容距離です。

曲線許容誤差は0.02ﾒｰﾄﾙに設定されています。


ｴﾗｰﾒｯｾｰｼﾞ

調整した座標

ﾌﾞﾚｰｸﾗｲﾝ交差

境界線交差

重複ﾎﾟｲﾝﾄ

無効なﾎﾟｲﾝﾄ名

座標はﾎﾟｲﾝﾄへﾏｯﾌﾟしていません


無効なﾎﾟｲﾝﾄ名

ﾀﾞｲｱﾛｸﾞに無効なﾎﾟｲﾝﾄ名が入力されると､ｴﾗｰﾒｯｾｰｼﾞが現れます。

「Xは有効なﾎﾟｲﾝﾄ名ではありません。」

ここではXはﾎﾟｲﾝﾄ名です。

ｺﾝﾀ面ﾓﾃﾞﾙの一部として定義されたﾎﾟｲﾝﾄ名を入力しなければなりません。最初定義されていないﾎﾟｲﾝﾄを必要とする場合には､

1.	Trimble Geomatics Officeｽｸﾘｰﾝに戻ります。

2.	ﾂｰﾙ/DTMLink /既存の面というﾒﾆｭｰｺﾏﾝﾄﾞを選択します。

既存の面ﾀﾞｲｱﾛｸﾞが現れます。

3.	面に対する新しいﾎﾟｲﾝﾄを追加します。

これ以上の詳細に関しては､Trimble Geomatics Office™ｿﾌﾄｳｴｱのｵﾝﾗｲﾝﾍﾙﾌﾟを参照してくだい。


座標はﾎﾟｲﾝﾄへﾏｯﾌﾟしていません

現在の面ﾎﾟｲﾝﾄの座標に一致しない座標をﾀﾞｲｱﾛｸﾞに入力すると､ｴﾗｰﾒｯｾｰｼﾞが現れます。

「座標はﾎﾟｲﾝﾄへﾏｯﾌﾟしていません。」

北距と東距ﾌｨｰﾙﾄﾞに既存ﾎﾟｲﾝﾄの座標を入力しなければなりません。

入力した座標が必要な場合には､

1.	Trimble Geomatics Officeｽｸﾘｰﾝに戻ります。

2.	それが存在しない場合には必要な座標を持つ新しいﾎﾟｲﾝﾄを追加します。

3.	ﾂｰﾙ/DTMLink /既存の面というﾒﾆｭｰｺﾏﾝﾄﾞを選択します。

既存の面ﾀﾞｲｱﾛｸﾞが現れます。

4.	面に対する新しいﾎﾟｲﾝﾄを追加します。

既存の面ﾀﾞｲｱﾛｸﾞに関するこれ以上の詳細に関しては､Trimble Geomatics Office™ｿﾌﾄｳｴｱのｵﾝﾗｲﾝﾍﾙﾌﾟを参照してくだい。


ポイントを含める

コンタ面モデルのポイントを含めるためには、面ツールバーの「ポイントを含める」ツール　[image] か、設計　/　「ポイントを含める」　　コマンドを使用します。

設計　/　ポイントを含める

「ポイントを含める」ダイアログを開くためにこのコマンドを使用します。　「ポイントを含める」ダイアログはメニューコマンドからのみ利用できます。

「ポイントを含める」ダイアログが有効な時には、　カーソルが　[image]　に変わります。

面に含むためのポイントを選択するには「ポイントを含める」　ダイアログのフィールドを使用します。

含めるポイント

ポイント名か、面に含むポイントの北距と東距座標を入力するために「含めるポイント」グループを使用します。

ポイント名

含めるポイントを判別するためにポイント名フィールドを使用します。それが有効な面ポイント名の場合には北距と東距フィールドは自動的に記入されます。

注：　無効な面ポイント名を入力するとエラーメッセージが現れます。

X　は有効なポイント名ではありません。

ここではX はポイント名です。

北距　/　東距

ポイント名がわからない場合には面ポイントの座標を入力するためにこのフィールドを使用します。

ヒント：　「含めるポイント」グループのポイントに対する北距と東距座標を入力するために　フィールド記入を使用します。

注：　有効な面ポイントの座標と一致しない座標を入力するとエラーメッセージが現れます。

座標はポイントへマップしていません。

適用

他のポイントが含まれるように入力したい場合には、面を更新しダイアログをリセットするために適用をクリックします。

1ポイントだけを含みたい場合には、面を自動的に更新してダイアログを閉じるためにOKをクリックします。

「ポイントを含める」　ツール

面の一部を形成しないポイントを含めるためには、面ツールバーの「ポイントを含める」　ツール　[image] をクリックします。

「ポイントを含める」アクションが有効な時には、　カーソルが [image]　に変わります。

グラフィックウインドウから含まれるべきポイントを選択します。

「ポイントを含める」アクションは面を自動的に更新します。

警告：　これから含めようとするポイントの間で以前三角形が削除されたことがある場合には、その三角形は再形成されます。

ヒント：「ポイントを含める」　アクションを取消す場合には、編集　/　「元に戻す」を使用します。


ポイントを外す

コンタ面モデルからポイントを除外するためには、面ツールバーの「ポイントを外す」ツール　[image] か　設計　/　ポイントを外す　コマンドを使用します。

設計　/　ポイントを外す

「ポイントを外す」　ダイアログを開くためにこのコマンドを使用します。　「ポイントを外す」ダイアログはメニューコマンドからのみ利用できます。

「ポイントを外す」ダイアログが有効な時には、　カーソルが　[image]　に変わります。

面から除外するためのポイントを選択するには「ポイントを外す」　ダイアログのフィールドを使用します。

外すポイント

ポイント名か、面から除外するポイントの北距と東距座標を入力するために「外すポイント」グループを使用します。

ポイント名

除外するポイントを判別するためにポイント名フィールドを使用します。それが有効な面ポイント名の場合には北距と東距フィールドは自動的に記入されます。

注：　無効な面ポイント名を入力するとエラーメッセージが現れます。

X　は有効なポイント名ではありません。

ここではX　はポイント名です。

北距　/　東距

ポイント名がわからない場合には面ポイントの座標を入力するためにこのフィールドを使用します。

ヒント：　「外すポイント」グループのポイントに対する北距と東距座標を入力するために　フィールド記入を使用します。

注：　有効な面ポイントの座標と一致しない座標を入力するとエラーメッセージが現れます。

座標はポイントへマップしていません。

適用

他のポイントが除外されるように入力したい場合には、面を更新しダイアログをリセットするために適用をクリックします。

1ポイントだけを除外したい場合には、面を自動的に更新してダイアログを閉じるためにOKをクリックします。

「ポイントを外す」ツール

ポイントが面モデルで使用されるのを防ぐために、面ツールバーの「ポイントを外す」ツール　[image] をクリックします。

「ポイントを外す」アクションが有効な時には、　カーソルが [image] に変わります。

グラフィックウインドウから除外されるべきポイントを選択します。

このオプションでは面を更新する必要がありません。「ポイントを外す」アクションは面を自動的に更新します。

注：　面の一部でないポイントを選択した場合にはエラーメッセージが現れます。

ヒント：「ポイントを外す」　アクションを取消す場合には、編集　/　「元に戻す」を使用します。

「ポイントを外す」アクションが便利な例として、ポイントが不正確なために不規則なコンタが発生した場合があります。このアクションを使用することでそのポイントを無視することができます


三角形交換

コンタ面モデルで2つの三角形を交換するには、面ツールバー　の「三角形交換」　ツール　[image] か設計　/　「三角形交換」コマンドを使用します。

設計　/　三角形交換

「三角形交換」　ダイアログを開くためにこのコマンドを使用します。「三角形交換」　ダイアログはメニューコマンドからのみ利用できます。

「三角形交換」　ダイアログが有効な時には、　カーソルが　[image]　に変わります。

面で交換するための三角形を選択するには「三角形交換」　ダイアログのフィールドを使用します。

1番目の三角形

交換される最初の三角形を判別するために「1番目の三角形」グループを使用します。

北距　/　東距

交換される最初の三角形を判別するために三角形内のあらゆる座標を入力します。

ヒント：　北距と東距座標を入力するためにフィールド記入を使用します。

2番目の三角形

交換される第2の三角形を判別するために「2番目の三角形」グループを使用します。

北距　/　東距

交換される第2の三角形を判別するために三角形内のあらゆる座標を入力します。

ヒント：　北距と東距座標を入力するためにフィールド記入を使用します。

適用

四辺形を形成する三角形を交換するためには適用をクリックします。

三角形を交換しダイアログを閉じるためにはOKをクリックします。

ヒント：「三角形交換」アクションを取消すには編集　/　「元に戻す」を使用します。

「三角形交換」　ツール

三角形を交換することで面モデルを変更するには、面ツールバーの「三角形交換」ツール　[image] をクリックします。

「三角形交換」　アクションが有効な時には、　カーソルが　[image] に変わります。

交換する最初の三角形を選択します。この三角形はスクリーン上では緑色で表示されます。

第2の三角形を選択します。2つの選択された三角形が四辺形を形成する場合には、対角線が渡る角が交換され、2つの新しい三角形が形成されます。以下の図1を参照してください。

三角形の交換

2つの隣接する三角形は一緒に四辺形を形成します。

図1参照

図1  三角形

「三角形交換」　ツール　や設計　/　三角形交換　コマンドは凸四辺形にのみ作用します。凹四辺形を選択した場合には、エラーメッセージが現れます。

三角形交換を行う時、ポイント間の高度勾配は新しい三角形の辺に沿って形成されます。生成されるコンタラインは微妙に違うことがあり、より真に近い描写をもたらすことがあります。

時によっては三角形を交換してもコンタ面を改善できません。これは、例えば、それはコンタ面が不規則である時に起こります。


三角形削除

コンタ面モデルで三角形を削除するには、面ツールバー　の「三角形削除」ツール　　[image]　　か設計　/　三角形削除コマンドを使用します。

設計　/　三角形削除

「三角形削除」　ダイアログを開くのにこのコマンドを使用します。「三角形削除」　ダイアログ　はメニューコマンドからのみ利用できます。

「三角形削除」　ダイアログが有効な時には、　カーソルが　[image]　に変わります。

面で削除するための三角形を選択するには「三角形削除」　ダイアログのフィールドを使用します。

削除する三角形

削除する三角形を判別するために「削除する三角形」グループを使用します。

北距　/　東距

削除する三角形を判別するために三角形内のあらゆる座標を入力します。

ヒント：　北距と東距座標を入力するためにフィールド記入を使用します。

適用

削除されるべき他の三角形を入力したい場合には、面を更新しダイアログをリセットするために適用をクリックします。

三角形を1つだけ除外したい場合には、面を自動的に更新してダイアログを閉じるためにOKをクリックします。

ヒント：削除された三角形を復元するには編集　/　「元に戻す」を使用します。

「三角形削除」　ツール

三角形の除去によって面モデルを変更するためには、面ツールバー　の「三角形削除」　ツール　[image] をクリックします。

「三角形削除」　アクションが有効な時には、カーソルが　[image] に変わります。

グラフィックスクリーンから削除する三角形を選択します。

除去される三角形

除去される三角形はデジタル地形モデル（DTM）に含まれません。長い非現実的な形をした三角形の中にコンタが形成されている面モデルの外端を整えることができる素早く効果的な方法が必要な時に、これは便利です。

警告：　境界線がモデルに追加されたか境界線がモデルで編集されたのでない場合には、削除された三角形は面更新には復元されません。

ヒント：　三角形が削除された後にモデルが復元され境界線が編集された場合には、削除された三角形はモデルの一部として復元されます。モデルの更新の後にも削除された三角形を保持したい場合には、更新の前に関係するポイント周辺に境界線を置きます。


ライン追加

コンタ面モデルにブレークラインと境界線を追加するためには、面ツールバーの「ライン追加」　ツールか設計　/　ライン追加コマンドを使用します。

設計　/　ライン追加

「ライン追加」　ダイアログを開くのにこのコマンドを使用します。「ライン追加」ダイアログ　はメニューコマンドからのみ利用できます。

コンタ面にブレークラインと境界線を追加するには「ライン追加」ダイアログのフィールドを使用します。

ラインタイプ

必要なラインタイプを特定するためにラインタイプグループを使用します。

以下の表がオプションを設定しています。

･･･を追加するには､	・・・をオンにします。
ブレークライン	ブレークラインのラインタイプチェックボックス。
境界線	境界線ラインタイプチェックボックス。外枠オプションか中抜オプションのどちらかを選ぶことで境界線のタイプを特定できます。
ブレークラインのラインタイプと境界線ラインタイプの両方	両方のチェックボックスと、外枠オプションか中抜オプションのどちらかを選ぶことでの境界線タイプの特定。中抜境界線を伴うブレークラインのラインタイプも外枠境界線を伴うブレークラインのラインタイプのどちらも可能です。
ライン開始

ライン開始に対する北距と東距か、ポイント名を入力するためにライン開始グループを使用します。

ポイント名

ラインの開始ポイントを判別するためにポイント名フィールドを使用します。これが有効な面ポイント名の場合には、北距と東距　フィールドは自動的に記入されます。

注：　無効な面ポイント名を入力するとエラーメッセージが現れます。

X　は有効なポイント名ではありません。

ここではX はポイント名です。

北距　/　東距

ポイント名がわからない場合に、開始ポイントの座標を入力するためにこのフィールドを使用します。

ヒント：　ラインの開始に対する北距と東距座標を入力するためにフィールド記入　を使用します。

ライン終了

ライン終了に対する北距と東距か、ポイント名を入力するためにライン終了グループを使用します。

ポイント名

ラインの終了ポイントを判別するためにポイント名フィールドを使用します。これが有効な面ポイント名の場合には、北距と東距　フィールドは自動的に記入されます。

注：　無効な面ポイント名を入力するとエラーメッセージが現れます。

X　は有効なポイント名ではありません。

ここではX はポイント名です。

北距　/　東距

ポイント名がわからない場合に、終了ポイントの座標を入力するためにこのフィールドを使用します。

ヒント：　ライン終了に対する北距と東距座標を入力するためにフィールド記入　を使用します。

注：　有効な面ポイントの座標に一致しない座標が入力された場合には、「ライン追加」　アクションは働きません。

追加

面にラインを追加するために追加をクリックします。終了ポイントは次のラインの開始ポイントになります。　ラインを継続するためには次の終了ポイントを追加します。

ヒント：　ポイントを判別するためにフィールド記入を使用する場合には、終了ポイントをダブルクリックするとラインが自動的に追加されます。

警告：　追加をクリックしても面は更新されません。コンタ面にラインを適用するには面アップデートをクリックします。

面アップデート

ラインを追加すると、面に更新が必要であることを示すために、ステータスバーのアップデートインディケータ　が変化します。

「ライン追加」　ダイアログを閉じる前に面を更新したい場合には、面アップデートをクリックします。

「ライン追加」　ダイアログを閉じた後に面を更新したい場合には、F4を押すか、設計　/　面アップデートコマンドを使用します。

全体包囲

コンタモデルに選択された全ポイントを包囲する外枠境界線を作成するために全体包囲をクリックします。この外枠境界線は、必要な境界線の詳細定義をすべて収集することは通常ありませんが、最初の外枠境界線定義を与えてくれます。この最初の定義を編集し必要な境界線定義を作成するためにはライン追加とライン削除の機能を使用します。

ヒント：　「ライン追加」　アクションを取消すには、編集　/　「元に戻す」を使用します。

「ライン追加」　ツール

面ツールバーの「ライン追加」　ツールでは以下を追加できます。

　　ブレークライン

　　中抜境界線

　　外枠境界線

　　ブレークラインを持つ外枠境界線

　　ブレークラインを持つ中抜境界線


ライン削除

コンタ面モデルのラインを削除するために面ツールバーの「ライン削除」　ツール　[image] か設計　/　「ライン削除」コマンドを使用します。

設計　/　ライン削除

「ライン削除」　ダイアログを開くのにこのコマンドを使用します。「ライン削除」ダイアログ　はメニューコマンドからのみ利用できます。

削除するラインタイプ

一覧から削除するラインタイプを選択します。

使用可能なタイプは以下の通りです。

ラインタイプ	このオプションが以下のアクションを起こします
すべて	ブレークラインと境界線がある面で選択したラインすべてを削除します。状況によってはラインは境界線とブレークラインであることもあります。このオプションが既定です。
ブレークライン	選択されたブレークラインのみを削除
外枠境界線	選択された外枠境界線のみを削除
中抜境界線	選択された中抜境界線のみを削除
外枠境界線とブレークライン	選択された外枠境界線とブレークラインのみを削除
中抜境界線とブレークライン	選択された中抜境界線とブレークラインのみを削除
ライン開始

ライン開始に対する北距と東距か、ポイント名を入力するためにライン開始グループを使用します。

ポイント名

ラインの開始点を判別するためにポイント名フィールドを使用します。これが有効な面ポイント名の場合には、北距と東距　フィールドは自動的に記入されます。

注：　無効な面ポイント名を入力するとエラーメッセージが現れます。

X は有効なポイント名ではありません。

ここではXはポイント名です。

北距　/　東距

ポイント名がわからない場合に、開始ポイントの座標を入力するためにこのフィールドを使用します。このフィールドは読込み専用なので、キーボードを使用して座標を入力することはできません。

ライン終了

ライン終了に対する北距と東距か、ポイント名を入力するためにライン終了グループを使用します。

ポイント名

ラインの終了点を判別するためにポイント名フィールドを使用します。これが有効な面ポイント名の場合には、北距と東距　フィールドは自動的に記入されます。

注：　無効な面ポイント名を入力するとエラーメッセージが現れます。

X　は有効なポイント名ではありません。

ここではX　はポイント名です。

北距　/　東距

ポイント名がわからない場合に、終了ポイントの座標を入力するためにこのフィールドを使用します。このフィールドは読込み専用なので、キーボードを使用して座標を入力することはできません。

ヒント：「ライン削除」　ダイアログが有効な時にグラフィックウインドウでラインを選択すると、開始ポイントと終了ポイントフィールドの両方が自動的に入力されます

適用

ラインを削除するためには適用をクリックします。

削除するラインを選択すると、面に更新が必要であることを示すために、ステータスバーのアップデートインディケータ　が変化します。

「ライン削除」　ダイアログを閉じる前に面を更新したい場合には、面アップデートをクリックします。

「ライン削除」　ダイアログを閉じた後に面を更新したい場合には、F4を押すか、設計　/　面アップデートコマンドを使用します。

ダイアログを閉じるためには閉じるをクリックします。

ヒント：「ライン削除」　アクションを取消すには編集　/　「元に戻す」を使用します。

「ブレークライン／境界線削除」ツール

「ライン削除」　ツールを使用してブレークラインと境界線　を削除します。

1．	面ツールバーの「ブレークライン／境界線削除」ツール [image] をクリックします。

2．	ラインタイプの一覧にアクセスするためにはツールの右の矢印をクリックします。

3．	削除したいラインタイプを選択します。

一覧から選択するオプションはフィルターの役目をします。グラフィックウインドウでラインをクリックすると、それが特定されたラインタイプのラインである場合にそれが削除されます。これは、2つのポイント間にラインが1つ以上ある時に特定タイプのラインだけを削除したい場合に便利です。

警告：他のラインタイプが選択されるまで、またはＤＴＭＬｉｎｋ�ソフトウエアを閉じるまでは、選択するラインタイプが既定ラインタイプとなります。

「ライン削除」　アクションが有効な場合には、カーソルが [image] に変わります。

４．	削除すべき境界線かブレークラインを選択します。

ラインを削除すると、面に更新が必要であることを示すために、ステータスバーのアップデートインディケータ　が変化します。

５．	面を更新するには、F4を押すか、設計　/　面アップデートコマンドを使用します。

６．	他のツールを選択するかF2を押すとそのツールをオフにできます。

注：外枠境界線ラインタイプを使用できる状況は以下の通りです。

建物が面の境界線上にある状況で中抜境界線に影響を与えずに外枠境界線を編集するには、一覧から外枠境界線　のラインタイプを選択し、グラフィックウインドウの適切な境界線ラインを削除します。


面アップデート

ラインを追加すると、面に更新が必要であることを示すために、ステータスバーのアップデートインディケータ　が変化します。

面を更新するためにF4を押すか、設計　/　面アップデートコマンドを選択すると、追加されたブレークラインか境界線ラインが適用されます。

「ライン追加」　ダイアログで面アップデートをクリックしても、面の更新が行われます。


｢外枠境界線追加｣ツールを使用しての外枠境界線の追加

1.	面ツールバーから「外枠境界線追加」ツール　[image]　を選択します。

アクションが有効な場合にはカーソルが [image]　に変わります。

2．	境界線が開始する面ポイントをクリックします。

3．	面ポイントを選択することによって外枠境界線　のセクションを追加し続けます。

濃紺のラインがスクリーン上の外枠境界線　ポイント間に現れます。

４．	境界線を閉じるために最初のポイントに戻ります。境界線を閉じないと、ＤＴＭＬｉｎｋ?ソフトウエアは面の更新時に境界線を閉じようとします。

ラインを追加すると、面に更新が必要であることを示すために、ステータスバーのアップデートインジケータが変化します。

５．	面を更新するには以下の1つを行ってください。

　　F4を押す

　　設計　/　面アップデートコマンドを使用する

６．	境界線の追加を終了するには、他のツールを選択するか、F2を押します。

注：「ライン追加」　ツールを使用して外枠境界線とブレークラインを追加するには、中抜境界線ツールの右の矢印を押して、プルダウンリストから外枠境界線とブレークラインを選択します。


｢中抜境界線追加｣ツールを使用しての中抜境界線の追加

「中抜境界線追加」ツールを使用して中抜境界線　を追加します。

1．	面ツールバーから「中抜境界線追加」ツール　[image]　を選択します。

2．	境界線が開始する面ポイントをクリックします。

アクションが有効な場合にはカーソルが　[image]　　に変わります。

3．	面ポイントを選択することによって中抜境界線　のセクションを追加し続けます。

水色のラインがスクリーン上の中抜境界線　ポイント間に現れます。

４．	境界線を閉じるために最初のポイントに戻ります。境界線を閉じないと、DTMLink�ソフトウエアは面の更新時に境界線を閉じようとします。

ラインを追加すると、面に更新が必要であることを示すために、ステータスバーのアップデートインディケータ　が変化します。

５．	面を更新するには以下の1つを行ってください。

　　F4を押す

　　設計　/　面アップデートコマンドを使用する

６．	境界線の追加を終了するには他のツールを選択します。

注：「ライン追加」　ツールを使用して中抜境界線とブレークラインを追加するには、中抜境界線ツールの右の矢印を押して、プルダウンリストから中抜境界線とブレークラインを選択します。


境界線とブレークライン　：　技術詳細

ここではデジタル地形モデル(DTM)がどのように作成されるのかを題目とし、ブレークラインと境界線の処理するモデルへの影響を論じます。

面が作成される時、DTMLink�ソフトウエアは面ポイント間に三角形を形成します。面ポイント間に形成されるライン（三角形の辺）は定数勾配であると仮定します。

以下の項目が論じられます。

　　境界線

　　ブレークライン

　　ブレークラインと境界線処理の影響

境界線概要

外枠境界線と中抜境界線という2種の境界線があります。外枠境界線とは、モデルの中に含まれる面の領域を定義するラインです。中抜境界線とは、モデルから除外された面の領域を定義するラインです。例えば、建物の側辺が中抜境界線として定義される場合には、コンタラインは建物を通って引かれることはありません。中抜境界線は外枠境界線の内側に定義されるべきですが、外枠境界線が中抜境界線の内側に作成された場合には、中抜境界線は外枠境界線を上書きします。

境界線は閉じた形状である必要があります。境界線が閉じられなかった場合には、面が更新される時に自動的にそれを閉じようとします。

ブレークライン概要

ブレークラインとは、定数勾配を持つとして知られる一連のラインです。DTMLink�ソフトウエアは、三角形モデルを調整するために各ラインの勾配を使用します。例えば、DTMLink ソフトウエアがラインを交差して不正確な補間をしないように、尾根の頂上や道路脇をブレークラインとして定義することができます。ブレークラインは、共通の交差ポイントを通るのでなければ、他と交差することは明らかにありません。

境界線とブレークラインの両方は、データベース　からポイントを連結する一連のラインとして定義されます。

ブレークラインと境界線処理の影響

境界線とブレークラインはモデルの三角形を再形成させます。以下の形状は、DTMLink ソフトウエアがブレークポイントを作成し面三角形を形成することでどのようにモデルを再形成するかを明示します。

注：　このセクションでは境界線とブレークラインは常時面ポイントAとBの間に示されます。三角形の頂点は必要に応じて番号付けされます。

例　1：　1つの三角形を交差するブレークライン

図1は1つの三角形と1つのブレークラインの単純化された非典型モデルを示します。ブレークポイントX　　とYは三角形とブレークラインの交差で形成されます

図　1　単純化されたブレークライン

ポイントX　とY　の高度は、ポイントＡとＢの間のブレークラインに沿って補間されます。こういったブレークポイントはモデルで面ポイントになり、3つの新しい三角形が形成されます。

例2：　複数の三角形を交差するブレークライン

図2は、定義されたブレークラインを持つ三角形モデルの描写を示します。

図 2　算出　（1）

三角形の再形成は、ブレークラインを持つ三角形の各辺の交差に挿入されたブレークポイントと共に、ブレークラインの経路を順次的にたどります。そのブレークポイントが示されています。各ブレークポイントの高度は、ポイントＡとＢの間のブレークラインに沿って補間されます。

このブレークポイントはその後面モデルの一部となり、10の新しい三角形が形成されます。図3を参照。　点線は形成された新しい三角形を示します。

図 3　算出　（2）

例3：　1つの三角形を交差する境界線

図　４は1つの三角形と1つの境界線の単純化された非典型モデルを示します。ブレークポイントX　　とYは三角形とブレークラインの交差で形成されます。三角形の頂点（1とする）は境界線の内側にあり、他の頂点（2・3とする）は境界線の外側にあると仮定します。

図　４　境界線　（1）

ポイントXの高度はポイント1と3の間で補間されます。ポイントY　　の高度はポイント1と2の間で補間されます。三角形はX　　とYの間に形成され、1とポイント2と3は面モデルから放棄されます。

図　５　は、境界線が形成された三角形の中を通るという同様の状況を示します。ここでもまた、ポイント1は境界線内にあると仮定します。

ポイントXの高度はポイント1と3の間で補間されます。ポイントYの高度はポイント1と2の間で補間されます。

図　５　境界線　（2）

2つの新しい三角形が形成され、ポイント2と3は面と形成された新しい三角形から放棄されます。

例　４：　1つの三角形を交差する境界線とブレークラインの混合

ラインは境界線とブレークライン両方の特徴を持つことができます。図6 参照

図6　境界線とブレークライン

ブレークポイントは、三角形とブレークラインの交差のポイントX とY 作成されます。

ラインＡ　Ｂはブレークラインであり境界線でもあるので、ブレークポイントX とYの高度はポイントＡとＢの間のブレークラインに沿って補間されます。

頂点1が境界線内にある場合には、ポイント1とX、Yによって定義される三角形が形成されます。ポイント2と3はモデルから放棄されます。


設計　/　すべてのライン削除

面のブレークラインと境界線のすべてを削除するためにこのコマンドを使用します。

以下の警告メッセージが現れます。

「この操作を元に戻すことはできません。この面からブレークラインと境界線のすべてを除去するにはOKをクリックしてください。」

ブレークラインと境界線のすべてを永久に削除するにはOKをクリックします。

OKをクリックすると面が更新されます。


｢ブレークライン追加｣ツールを使用してブレークラインを追加
「ブレークライン追加」ツールを使用してブレークラインを追加

「ブレークライン追加」ツールを使用してブレークラインを追加します。

1.	面ツールバーの「ブレークライン追加」ツール　[image]　をクリックします。

アクションが有効な場合には、カーソルが [image]　に変化します。

2．	ブレークラインが始まる面ポイントをクリックします。

3．	面ポイントを選択することによってブレークラインのセクションを追加し続けます。

赤色のラインがスクリーン上の選択された面ポイント間に現れます。

境界線を閉じるために最初のポイントに戻ります。境界線を閉じないと、DTMLink�ソフトウエアは面の更新時に境界線を閉じようとします。

ラインを追加すると、面に更新が必要であることを示すために、ステータスバーのアップデートインディケータ　が変化します。

４．	面を更新するには以下の1つを行ってください。

　　F4を押す

　　設計　/　面アップデートコマンドを使用する

５．	ブレークラインの追加を終了するには他のツールを選択するかＦ2を押します。

次のブレークラインを追加するには、

　　「ブレークライン追加」ツール　を再びクリックして、上の手順1-5を繰り返します。

ヒント：　以下を使用してブレークラインと境界線を追加できます。

　　外枠境界線ツール

　　中抜境界線ツール

プルダウンメニューから境界線とブレークラインを選択します。


設計メニュー

面を編集するために設計メニューを使用します。それには以下のコマンドが含まれます。

ポイントを含める

ポイントを外す

三角形交換

三角形削除

ライン追加

面アップデート

ライン削除

すべてのライン削除


テクニカルサポート

何らかの問題が発生し､それに関する情報が製品マニュアルの中に見つからない場合には､お近くの取り扱い代理店までお問い合わせください。

または､Trimbleウェブサイト(http://www.trimble.com/support.html/)からテクニカルサポートを依頼してください。


登録商標

Trimbleというﾄﾘﾝﾌﾞﾙ社のｼﾝﾎﾞﾙﾏｰｸは､US Patent and Trademark Officeに登録されたTrimble Navigation Limitedの登録商標です。

DTMLink,RoadLink､Trimble Geomatics Office､Trimble Survey ControllerはTrimble Navigation Limitedの登録商標です。

その他の登録商標の全所有権はそれぞれの所有者に帰します。


保証

保証の棄権

｢有限保証｣と示されていない場合には､ﾄﾘﾝﾌﾞﾙ社のﾊｰﾄﾞｳｴｱやｿﾌﾄｳｴｱ､ﾌｧｰﾑｳｴｱ､参考文書は｢ありのままの状態｣で提供されます。特定目的に対する市販性や適合性の言外保証を含みながらもそれに制限されることなく､Trimble Navigation Limitedと作成や製作､配布に関わったすべての人の誰も明示､または有限の保証を行いません。ﾄﾘﾝﾌﾞﾙ社のﾊｰﾄﾞｳｴｱやｿﾌﾄｳｴｱ､ﾌｧｰﾑｳｴｱ､ﾏﾆｭｱﾙ等の参考文書の質や性能に関しては一切保証を行いません。州によっては言外保証の除外を許可しないので､上記の除外事項は適用しないこともあります。

有限責任

あらゆる状況においてTrimble Navigation LimitedとTrimbleｿﾌﾄｳｴｱの作成や製作､配布に関わったすべての人はあらゆる損害に関するあらゆる申し立てに責任をとることはありません。それには､利益損失､貯蓄損失､その他の特別な､または偶発の､結果的､典型的損害が含まれます。ﾄﾘﾝﾌﾞﾙ社のｿﾌﾄｳｴｱや参考文書の質や性能､使用責任､使用によって発生した損害､第三者によって査定されたか第三者に支払われたあらゆる損害も含まれますがそれに制限されることはありません。Trimble Navigation Limited やすべての関係者､ｴﾝﾃｨﾃｨが損害の可能性や他の団体によるあらゆる申し立てを知らされていたとしてもそれは適用します。州によっては偶発か結果的な損害に対する責任の制限や除外を許可しないので､上記の除外事項は適用しないこともあります。

ｿﾌﾄｳｴｱ･ﾌｧｰﾑｳｴｱ有限保証

Trimble Navigation Limitedは､ﾄﾘﾝﾌﾞﾙ社の製品やｺﾝﾋﾟｭｰﾀ製品､ｵﾍﾟﾚｰﾃｨﾝｸﾞｼｽﾃﾑが設計目的に合わせて使用される限り､ｿﾌﾄｳｴｱとﾌｧｰﾑｳｴｱ製品は記載された設計明細書に実質上一致することを保証します。ﾄﾘﾝﾌﾞﾙ社から出荷の30日後から数えて90日間は､配布されたｿﾌﾄｳｴｱとﾌｧｰﾑｳｴｱ上のﾒﾃﾞｨｱと参考文書はその素材と仕上がりに関しては欠陥の無いこともﾄﾘﾝﾌﾞﾙ社は保証します。90日の保障期間中ﾄﾘﾝﾌﾞﾙ社は､無償で欠陥のあるﾒﾃﾞｨｱを交換し重大なﾌﾟﾛｸﾞﾗﾑの誤りを訂正します。欠陥のあるﾒﾃﾞｨｱや参考文書を交換したりﾌﾟﾛｸﾞﾗﾑの誤りを訂正したりできない場合､ﾄﾘﾝﾌﾞﾙ社はそのｿﾌﾄｳｴｱに支払われた代金を払い戻します。これが保証不履行に対する唯一の是正手段です。


World Wide Webｻｲﾄ

ﾄﾘﾝﾌﾞﾙ社の対話式情報には､World Wide Webの弊社ｻｲﾄをご覧ください。
(http://www.trimble.com/)


ｺﾒﾝﾄ

この製品をお買い上げいただきましてありがとうございます。この製品に関するご意見やご提案などありましたらどうぞ下記までお知らせください。

Trimble Navigation Limited
645 North Mary Avenue
P.O.Box 3642
Sunnyvale,CA 94088-3642
U.S.A.

Phone:+1-408-481-8940
1-800-545-7762
Fax:+1-408-481-7744
http://www.trimble.com/

このﾏﾆｭｱﾙに関してのｺﾒﾝﾄもお知らせください。次回の改正時に参考にさせていただきます。

ｺﾒﾝﾄをご提出いただく場合には､ご意見やご提案を上記の住所か以下のｱﾄﾞﾚｽにEﾒｰﾙをお送りください。ReaderFeedback@trimble.com

ご意見やご提案のすべてはﾄﾘﾝﾌﾞﾙﾅﾋﾞｹﾞｰｼｮﾝ社の所有物となります。