Copyright: (C) 1999-2002 Trimble Navigation Limited
Citation: (C) 1999-2002 Trimble Navigation Limited


    网平差 - 目录

包括下列主题：

  网平差

  平差基准

  网平差形式

  点

  观测值

  观测值组

  加权策略

  调整

  校正坐标

  删除平差

  网平差报告

要学习如何使用帮助，请按F1键。

如果您的问题不能在帮助系统里找到答案，请查阅Trimble Geomatics Office − 网平差用户手册、联系当地经销商或查看技术支持。

© 1999−2002，Trimble Navigation Limited。版权所有。


    网平差 - 综述

更多信息

 亦请参见

综述

执行网的最小二乘平差的目的是：

  估计和删除随机误差

  有多余数据时提供一个单一解算

  对观测值改正的最小化

  检测故障和大的错误

  生成分析信息，包括精度估计

成功完成最小二乘平差后，将需要决定：

  观测值和控制点里没有故障和系统错误。

  任何剩余误差都是小的、随机的和适当分布的

最小二乘平差会确保好的位置闭合和可重复性的估计。因此，它能确保当前和未来测量的可靠性。

要成功地完成平差，最小二乘网必须达到以下标准：

  网必须几何地和数学地闭合。

  残差的加权平方和必须最小化。

几何地关闭网意味着用好的、闭合的几何图形设计网。GPS或地面网由网点之间的一系列观测值组成。这些观测值创建闭合的几何图形，例如三角形。

数学地关闭网意味着已经从观测值里排除了所有大的错误和故障，因而可确保获得合格的统计结果。

通过“您必须从观测值中把残差的加权平方和最小化”的叙述，可以知道保持加权平方最小值与数学关闭网有关联。简单地说，在平差每个观测值时，所有观测值（平方）的总平差一定是可能的最小数值。

Trimble Geomatics Office软件会测试这个指标，并让您知道任何妨碍网平差达到这个指标的观测值或控制点。

平差网时间和原因

在下列操作之后开始网平差：

  GPS基线处理(处理原始GPS数据)

  导入RTK基线(带有QC1 & QC2 数据)和/或地面数据

  删除由超限误差产生的误差标志

提示：Trimble强烈建议您在开始平差前先阅读附录A：Trimble Geomatics Office − 网平差用户指南里的最小二乘平差指南。

注：如果在执行网平差前，已经完成或导入了（从DC文件里）GPS测点校正，您将被要求在开始网平差前接受对GPS点校正（参数）的删除。Trimble Geomatics Office 软件不允许在一个项目里既有来自网平差的转换参数又有来自GPS点校正的校正参数，只能使用两者中的一个。

网平差程序

两个主要的网平差程序包括：

1.	使用内部约束时，从最小约束平差(或自由平差)开始，调整和执行观测值的质量控制检查。步骤如下：

  检查网的内部一致性

  检测故障或不合适的观测值

  得到精确的观测值误差估计

2.	执行完全约束平差。步骤如下：

  把网与已有控制(基准)进行参照比较

  校验已有控制

  产生网的转换参数

  得到精确的坐标误差估计

有关执行GPS和地面观测值组合的平差的信息，请看执行组合平差主题。

注：在WGS-84基准上完成GPS观测值的最小约束平差后，可以保存平差点的WGS-84坐标。这些被保存的WGS-84坐标用作GPS测点校正里的GPS点。在完全约束平差里生成了用作校正格网点的当地格网坐标后，可以执行一个在域中使用的校正（放样）。在开始GPS点校正前，您会被要求接受对平差转换参数的删除。要确认网平差已经在开始GPS点校正之前完成。更多信息，请看GPS 点校正。

注：如果想用Trimble Survey Controller软件里传输来的数据执行网平差，请确认执行测量时，在测量控制器测量形式里输入了压力、温度、曲度和折射改正。


    基准 - 综述

更多信息

如何做 ...	亦请参见
综述

一般而言，基准是用来决定地球表面点坐标的参考框架。全世界使用不同的当地基准来定义当地的坐标。但也有用于定义世界坐标的世界基准。典型地说，在测量中使用的已知控制点就是基于一个使用当地基准的当地坐标系统。在采集域中的GPS观测值时，观测值是以世界基准WGS-84作参考的。

在Trimble Geomatics Office软件里创建项目并定义它的项目属性时，应该选择一个具体的当地基准(项目基准)作为项目坐标系统的参考。项目坐标系统随基准一起被用来为项目里的所有点生成坐标。

执行网平差前，可以选择用于最小约束和完全约束平差步骤的基准。根据这一步骤的目的，它被称为平差基准。可以选择WGS-84或项目基准作为平差基准。选择的平差基准只应用于平差。

如果执行GPS观测值的最小约束平差，请使用WGS84基准，这个基准被全球定位系统采用。使用WGS-84以外的其它基准，会引起平差或多或少地把残差应用到每个观测值，以弥补参考框架中的差异。

必须为每个平差步骤选择正确的基准，即：

  在用GPS数据执行最小约束平差前，选择WGS-84基准。

  在用地面数据执行最小约束平差前，选择项目基准。(如果为最小约束平差选择的基准不是项目基准，在执行完全约束平差前选择项目基准。)

注：WGS-84可以作为项目基准使用。一些测量使用控制点作为以WGS-84为基准的坐标参考。在这种情况下，为最小约束和完全约束平差步骤选择的基准就只有一个而且是同一个。

注：属性窗口里的格网和当地坐标总结总是用为项目选择的系统坐标来显示。选择WGS-84作为平差基准不会影响格网和当地坐标的显示。

更多信息，请看选择基准。


    WGS-84基准

更多信息

如何做 ...	亦请参见
综述

如果执行GPS观测值的最小约束平差，使用WGS-84基准(这个基准由全球定位系统使用)。

如果在平差GPS基线时不用WGS-84基准，平差会生成不同的加权结果。这是因为在基线模拟处理时，基准差别会嵌入到观测值中。

更多信息，请看选择基准。


    项目基准

更多信息

如何做 ...	亦请参见
综述

可以从项目属性对话框的坐标系统标签里选择项目基准。

执行最初的最小约束平差后，选择项目基准作为平差基准。

完全约束平差步骤把需要的转换参数应用于：

  以当地坐标系统(项目基准)作为您的GPS观测值(WGS-84)的参考。

  转换地面观测值来适应您的当地控制。

在这个平差步骤中，可以以项目基准为参考来约束控制点，有效地把WGS-84-参考观测值转换到所选择的项目基准中。

更多信息，请看选择基准。


    观测值组 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

网平差软件会让您把观测值集划分为组。可以创建下列类型的组：

  方差组

  转换组

将观测值分组，可以让您更好地估计每种类型观测值的误差。

方差组

在单个网的测量中，往往会使用不同组的观测值。平差必须以一种方式说明与这些GPS观测值相关的不同误差。在Trimble Geomatics Office软件里，方差组提供为这些观测值分组的功能。

显而易见，使用的测量方法越精确，观测值误差就越小。

平差处理器决定每个组单独的参考因子和自由度。这显示了每个组是如何给总体网平差作贡献的。使用方差组选项可以为加权策略对话框中的标量应用到控制单独缩放每个组。

在缺省情况下，GPS、地面和大地水准面观测值会自动划分为缺省的方差组(<GPS缺省>、<地面缺省>和<大地水准面缺省>组)。

注：在任何网平差里，<大地水准面缺省>组都是唯一的大地水准面方差组。因为用同一种方法为来自同一个大地水准面模型的水准面观测值插值，所以没有必要把它们分到多重组里。

注：如果有超过了最短线(< 25 米)的观测值，Trimble建议您为这些观测值创建一个单独的方差组，这样它们可以被分开缩放。

转换组

转换组是观测值的选择项，在平差过程中属于同一个转换或转换集。每个转换组都有一套转换参数，可以被单个或整集地应用于转换组内的观测值转换集中。

可以通过定义一个或多个转换参数来控制应用于每组的转换。如果只对应用转换于偏差参数感兴趣，可以设置每个偏差转换参数的状态为计算，同时其它参数设置为不使用。

在缺省情况下，对于GPS观测值的转换组，这些转换参数会设置为计算：

   经度偏差

   纬度偏差

   方位旋转

   网尺度

在缺省情况下，对于地面观测值只有方位旋转会设置为计算。其它参数可以设置为用户定义或计算，但它们只在观测值里发生系统误差时才会被使用。例如，在运行一个平差而且所有距离（由地面技术测量）都有+3 ppm的残差时，距离尺度就会因为数据采集里有一个系统误差而被计算。这个系统误差可能是由设置在EDM上的ppm没有被应用而造成的。

注：Trimble Geomatics Office 软件可以让您输入用户定义的转换参数。Trimble建议在对转换参数有一个完整的理解后再手动定义输入参数值。

有关转换参数的更多信息，请看转换参数 � 综述主题。


    网平差报告 - 综述

更多信息

亦请参见	对话框
综述

这个报告用来查看网平差过程中生成的信息和统计。

要查看网平差报告：

  选择报告 / 网平差报告。

电脑缺省的HTML浏览器启动，网平差报告出现。

当报告出现时，可以使用HTML浏览器命令浏览下列部分：

  平差形式设置

  残差限差

  协方差显示

  地面控制

  安装错误

  统计总结

  叠代次数

  全球统计

  GPS观测值统计

  水准面模型统计

  地面观测值统计

  加权策略

  平差坐标

  格网坐标

  大地坐标

  坐标变化量

  控制坐标比较

  平差观测值

  GPS 观测值

  水准面观测值

  地面观测值

  标准化残差柱状图

  点误差椭圆

  协方差值

有关估计报告统计的原则以及主题都列在了上面。

注：可以通过选择网平差报告里的超限观测值来选择测量视图里的超限观测值。方法是：从网平差报告里选择观测值的ID（如果选择多个观测值，使用Ctrl键）。当前测量视图里的选择项会被清除并被报告里选择的观测值代替。


    平差 - 综述

更多信息

如何做 ...	亦请参见
综述

平差命令用来开始进行平差处理。

要开始一个平差，选择下列方法之一：

  从测量视图菜单选择平差 / 平差。

  按F10键。

  在项目栏里选择平差组，然后单击平差图标。

一旦开始处理，所有的平差叠代都会自动执行。使用状态栏查看网平差的状态。执行每个平差叠代时都会出现相应的信息。

平差处理器最多可执行定义在平差形式里的最大叠代次数。在每次叠代过程中，每个观测值的残差都被测试，以用来决定是否与定义在平差形式里的限差相匹配。如果网在最大叠代次数消失前收敛，平差处理就会以较少的叠代结束。

当观测值的残差通过合格测试标准时，就将执行网的收敛和以下功能：

  网平差里的每个点平差数值被作为带有点平差质量的当前坐标值而保存到项目中。

  为平差中每个点创建一个附加坐标子记录。子记录的类型基于以下指标：

  如果点固定在平差里，而且没有用NGS数据表或作为ASCII文件里的控制点被导入，一个Office 输入的子记录也会保存。

  网平差里每个点的平差值会变成带有已平差点质量的坐标值。以前输入的约束点坐标和点质量（控制）会保留。

  在属性窗口里，一个平差坐标页面会为平差的每个点而创建。点平差质量会分配给所有无约束的点分量。任何约束的分量都是空的。

  自动执行重新计算。重新计算会给所有无网点决定新的坐标。新坐标用从平差（和固定）坐标得到的无网观测值来计算。

  平差点的符号改变为黄色实线圆。

  为平差的每个点生成误差椭圆和箭头。

  网平差里所有的其它点都被保存。

  平差点的符号改变，图形窗口使用黑色背景时改变为黄色实线圆。图形窗口使用缺省背景时，改变为蓝色实线圆。

  误差椭圆为平差的每个点（不是为固定的水平点）而生成。

可以查看属性页面里每个点的平差值。如果误差椭圆显示选项被打开，椭圆会显示在图形窗口的每个平差点上。

现在可以通过查看网平差报告来开始分析网平差的结果。


    加权策略 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

加权策略可以让您定义应用加权和比例到各个观测值类型（GPS、地面和大地水准面）而使用的方法。Trimble Geomatics Office 软件可以让您给每个观测值类型定义不同的加权策略。

基于观测值的类型和质量来加权每个观测值非常重要。它允许平差适当地缩放每个观测值的先验误差估计。在定义加权策略时，可以应用一个标量到这些观测值中：

  所有观测值

  每个观测值

  方差组

典型地，您将把标量类型应用到所有观测值或方差组中，这取决于测量时使用的方法。在为每个观测值设置应用标量到选项时，用户定义标量类型选项会被禁用。应用标量到每个观测值通常只是出于分析目的。它可以帮助寻找网平差中造成问题的单个观测值。

当选择了应用标量值的方法后，就可以定义用于平差的标量类型。可以选择下列标量类型：

  缺省

  可选择

  用户定义

  自动

在一些平差里，对一组观测值计算的先验误差估计可能会估计不足。使用正确的加权策略允许缩放先验误差，因此可以为所有观测值估计正确的误差。

开始平差时，同应用缺省标量类型到所有观测值一样，缺省加权策略会被设置。缺省标量把先验误差乘以1.00，不改变误差估计。

如果观测值里的估计误差和实际误差相匹配，报告的参考因子就应该大约是1.00。一旦平差被执行，可能就会发现参考因子并不接近1.00，这表明一些缩放需要使估计误差与实际误差相匹配。应用标量的最简单方法是选取可选择标量类型。可选择标量类型使用从当前平差得到的参考因子乘以过去的标量，从而确定下一次平差的标量。这会有效地使参考因子接近1.00。可选择标量应用在后续的平差，直到参考因子接近1.00且通过Chi-平方测试为止。自动标量类型选项会自动进行这个过程。

注：使用可选择标量类型前，第一次平差的参考因子必须是一个可接受的数值。通常，高参考因子表示平差里有大的误差出现。在开始下一个平差前，应检查超限(即高残差观测值)。把可选择标量类型应用到带有高参考因子的平差里会造成标量提高到一个不可接受的数值。

一旦参考因子合格而且x-平方测试通过，就可以锁定最近计算的标量。锁定的标量自动设置标量类型为用户定义。

警告：在选择用户定义标量类型并输入标量值时要小心。使用用户定义标量类型前，应该对误差估计、加权策略和标量有一个完整的理解。


    命令 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

执行网平差需要的所有命令都在平差菜单里。产生网平差报告的命令在报告菜单里。网平差命令按照执行平差的步骤排列。使用网平差命令可以帮助指导您进行整个网平差过程。

平差菜单里包括下列命令：

  基准

  WGS-84 (基准)

  项目基准

  平差形式

  点

  观测值

  观测值组

  转换组

  方差组

  加权策略

  平差

  校正坐标

  保存 (校正坐标)

  删除 (校正坐标)

  删除平差

查看 / 工具栏子菜单里包括下面一项命令：

  椭圆控制

注：选择误差椭圆命令与选择查看选项对话框− 误差椭圆控制标签里的显示点误差椭圆和箭头检查框是一样的。

椭圆控制工具栏里包括下列命令：

  误差椭圆

  高度误差

  高程误差

报告菜单里包括下面一项命令：

  网平差报告

观测值对话框里包括下面一项命令：

  禁用观测值

注：禁用观测值命令和从属性窗口里把观测值状态改为禁用的效果一样。禁用的观测值只能从属性窗口里被重新激活。更多信息，请看禁用观测值和重新激活禁用观测值。


    转换参数 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

在完全约束平差过程中，转换基于为单个转换组选择的转换参数设置被计算和应用的。每个转换组包括GPS、地面或大地水准面观测值和相关的转换参数集，这些参数如果被计算，可以应用到转换组观测值中。

每个转换组有7个参数。每个转换参数包括一个数值域，它可以有选择地用来定义应用于完全约束平差期间的转换参数。每个数值域都有一个相关的状态设置，可以决定数值域里的数值是未定义、计算或用户定义的。

包括以下7个参数：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常量

  高度常量

前四个参数被用于基准转换，例如把WGS-84基准转换为项目(当地)基准。偏斜控制水平线上的倾斜，方位旋转用于方位角，网尺度应用于所有线性（距离和高度）观测值。

剩余的三个参数一般用于解决观测值组里可能的系统误差。

在缺省情况下，下列转换参数设置为GPS观测值转换组的计算：

   经度偏差

   纬度偏差

   方位旋转

   网尺度

在缺省情况下，对于地面观测值只有方位旋转设置为计算。其它参数可以设置为用户定义或计算，但它们只在观测值发生系统误差时才被使用。例如，在运行一个平差而且所有距离（由地面技术测量）都有+3 ppm的残差时，距离尺度参数就会被计算，因为在数据采集里有一个系统误差。这个系统误差可能是由设置在EDM上的没有被应用的ppm造成的。

注：方位旋转、网尺度、距离尺度和距离常数参数不用于大地水准面转换。

设置一个参数状态来进行计算，并不意味着参数被计算和应用于完全约束平差过程中。软件估计网内的约束数目，并决定需要的约束数量是否可以计算一个参数。例如，偏斜需要固定最少3个网内垂直坐标。如果不足3个垂直坐标被固定，偏斜参数就不会被计算和应用。

用户定义状态的设置允许预先定义任意一个或所有应用于转换组的转换。如果状态设置为用户定义，输入的数值就会应用于观测值，并在平差过程中不被计算。

注：虽然Trimble Geomatics Office软件允许输入用户定义的转换参数，在尝试定义任何转换参数前，您必须对转换参数有一个完整的了解。

在产生网平差报告成时，参数的状态表示数值被报告的方法。会产生以下情况之一：

  如果任何参数的状态被设置为不使用，这个参数值就不在平差观测值部分报告。

  如果任何参数的状态被设置为计算，但由于没有足够的约束平差又不能计算一个参数值时，就没有参数值包含在报告的平差观测值部分里。一旦平差可以计算参数，参数值就会包含在报告的平差观测值部分里。

  如果任何参数的状态被设置为用户定义，无论约束数目为多少，输入的参数值都会被报告。

提示：也可以从项目属性窗口中详细坐标系统属性标签的平差标签里查看转换参数。

注：选择观测值时，已观测的观测值会显示在属性窗口里。已平差或已转换的观测值不能从属性窗口里查看。

更多信息，请看定义转换参数。


    校正坐标 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

保存校正坐标让您为一个点把GPS坐标保存到WGS-84基准上。在完成最小约束平差后，这些坐标被保存。在当地基准上完成完全约束平差后，可以为点保存格网坐标。

注：如果平差基准设置为WGS-84且只有GPS观测值被平差时，保存校正坐标选项才有效。

创建校正坐标可以使用下列两个方法：

  已有点

  带后缀的新建点

校正组的保存坐标包括下列选项：

已存在的点

如果选择在已存在的点下保存坐标，坐标就会保存到相应点记录下。在没有其它测量数据的情况下，这些坐标只用于定位点。它们只为校正而保存。

如果在已存在的点下保存点，GPS点校正对话框里的点列表会被自动填补。

带后缀的新建点

如果选择在带后缀GPS的新建点下保存坐标，一个名称是“<点名称>-GPS”的新点就会创建。这些坐标只用于在没有其它测量数据的情况下定位点。它们只为校正而保存。

这个选项用来把GPS点校正的GPS和格网点分开。

查看校正坐标

当校正坐标保存到项目里时，可以在属性窗口里查看校正点的属性。

删除校正坐标

也可以删除校正坐标。平差菜单里的校正坐标命令会显示一个带有从项目里删除校正坐标的删除命令子菜单。


    网平差生成的坐标页面

更多信息

 亦请参见

综述

执行网平差时，平差坐标会为平差里的每个无约束点而生成。可以在属性窗口里查看平差坐标。

平差坐标被生成到当前的平差基准里。例如：

  如果在WGS-84基准上执行网平差，一个平差WGS-84坐标就会建立。

  如果在项目基准上执行网平差，一个平差格网坐标就会建立。

注：已经固定在点对话框里的坐标会得到一个固定的控制质量。 不能编辑这些坐标。

平差质量坐标用在未固定控制坐标前。在进一步平差前和在平差删除时，这些平差质量坐标会被删除。


网平差里的坐标均匀化的重要性

在平差Trimble Geomatics Office项目里的数据前，必须导入一个质量好的控制点。这是因为把数据导入软件后，需要执行一个重新计算来决定导入点的计算位置，并且软件为它的计算使用控制点。

生成的不良坐标可能导致基线模拟过程中观测值的不适当缩放，这会造成网平差的错误结果。在模拟过程中，垂直坐标误差会产生缩放误差。

要阻止不良坐标通过平差，请确认：

  观测值来自高质量的坐标

  数据均匀，就是指数据里没有大的闭合误差

如果在项目里存在闭合差误差时您要执行平差，不均匀数据警告对话框就会出现。在进行最小约束平差前，要删除不均匀数据。

注：只有在使用缺省标量的平差过程中，软件才会检查不均匀数据。在编辑数据并准备执行另一个平差时，确认设置了加权策略对话框里的缺省标量选项（在GPS、地面和大地水准面标签里）。


平差失败误差信息

综述

执行平差时可以出现以下错误信息：

  平差失败 − 没有收敛

  平差失败 − 水平或垂直坐标不稳定

  平差失败 − 转换不稳定

平差期间，由于各种原因，这三种错误都可能发生。使用这些信息来识别平差中的问题点，然后研究数据。

平差失败−没有收敛

平差点坐标没有从一个平差叠代改变到另一个时，平差就完成。在平差中的点坐标被超过残差的限差改变时，这条信息出现。数据里可能存在造成平差不收敛的故障。例如：

  点的未平差坐标可能接近平差值。

  观测值里有误差 (例如，一个观测的方位角可能有180度的误差)。

平差前，需要确认所有故障都已删除。

观测距离小于25米的平差中的角度也可能引出这条信息。增加“残差限差到结束叠代”到一个可以适应改变坐标的数值(1.0 e-3 m)。

平差失败−水平或垂直坐标不稳定

这条信息由平差计算时的数学误差造成。

这条信息会告诉您有问题的是水平还是垂直坐标，并且确定造成误差的点。检查网、确定问题点、同时研究数据。

平差失败−转换不稳定

这条信息由平差计算时的数学误差造成。它告诉您造成问题的参数和转换组的名称。

如果一个网的GPS部分没有完全整合到地面部分，这条信息也会出现。例如，在一个由GPS和地面观测值组合的网中，当网的地面部分有两个或更多的组成部分没有互相连接时，这个问题就会发生。更多信息，请看组合不同类型观测值到一个网平差里主题。

请确认有足够的观测值把GPS和地面观测值联系起来，并且/或者关闭GPS转换。或者通过约束一个直接连接到网的GPS部分的点坐标来解决问题。


    网平差形式对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

用这个对话框选择、查看、创建、复制、编辑、重命名并删除平差形式。当前的形式叫激活形式。为激活形式定义的设置都要应用到下一个平差中。

可以创建形式库，从而执行不同类型的平差，并在多重项目中分享这些形式。

要查看网平差形式对话框：

  选择平差/平差形式。

下列选项可以使用：

激活形式

用这个域为网平差识别当前的激活形式。新的激活形式从形式列表中选择并出现在该域中。这个域只为显示用，不能编辑。

形式列表

从列表选择激活形式。一旦形式被激活，就可以选择对话框右侧的按钮，来对该形式进行编辑、复制、重命名或删除。

如果选择一个形式，单击确认，该形式就变为平差的激活形式。

Trimble Geomatics Office 软件带有一些预定义的平差形式。可以复制它们，并用来作创建新形式的基础。也可以自己创建新形式。任何平差形式都可编辑。

列表中的形式不保存在项目中，而是存储在可用于多重项目的 Windows 注册中。

编辑

单击该按钮，查看或编辑形式。一旦选择了该按钮，从形式列表中选择的形式就变为激活形式，并且带有编辑平差形式选项的编辑平差形式对话框出现。

新建

单击该按钮，创建新的平差形式。单击了按钮后，新建形式对话框出现。

命名了新形式后，该形式就成为激活形式，并且带有编辑平差形式选项的编辑平差形式对话框出现。更多信息，请参见创建形式。

注：创建了新形式后，‘95% 置信度限制’形式被用作缺省形式。

复制

单击该按钮，复制激活形式，并用它作创建新平差形式的基础。单击了此按钮后，复制的形式就变成激活形式，复制形式对话框出现。

命名了新形式后，带有编辑平差形式选项的编辑平差形式对话框出现。更多信息，请参见复制形式。

重命名

单击该按钮，显示重命名形式对话框。用名称域输入新形式名称。单击确认后，Windows 注册中的形式名称被重命名，形式变为激活，新名称出现在激活形式域中。更多信息，请参见重命名形式。

删除

单击该按钮，删除激活形式。删除的形式从Windows 注册中永久消失，不再可用。更多信息，请参见删除形式。


    编辑平差形式对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

要查看或编辑激活的平差形式，则查看该对话框。

如果查看编辑平差形式对话框：

1.	查看网平差形式对话框，选择平差/平差形式。网平差形式对话框出现。

2.	从形式列表中选择形式。

单击编辑。

编辑平差形式对话框出现。

下列标签可以使用：

一般

选择该标签查看或编辑平差形式的残差限差、Sigmas 标量和一般属性。更多信息，请参见一般。

协方差显示

选择该标签查看或编辑平差形式的二维和三维协方差显示选项。更多信息，请参见协方差显示。

地面控制

选择该标签查看或编辑标准误差设置，并选择所实行的平差类型（水平、垂直或二者）。更多信息，请参见地面控制。

安装错误

选择该标签查看或编辑天线高度、天线对中、仪器高度和仪器对中(铅垂)的已知错误。这些定义将应用到全球范围的所有观测值，以便补偿计算平差时的误差。更多信息，请参见安装错误。


    编辑平差形式对话框 - 一般标签

更多信息

如何做 ...	对话框	亦请参见
综述

用这个对话框定义平差形式的残差 限差、sigma 标量 和一般属性。

要查看编辑平差形式对话框的一般标签：

1.	查看网平差形式对话框，选择平差/平差形式。网平差形式对话框出现。

2.	从形式列表选择形式。

3.	单击编辑。编辑平差形式 对话框出现。

4.	选择一般标签。

以下选项可以使用：

使用缩小的圆柱剖面图

选择该检查框可减小平差网所需的计算机内存量。对于大网，该选项可减小需要完成平差的时间量。

注：该选项使用美国国家大地测量 (NGS) 开发的组合运算。

使用该选项不影响平差结果，只是不允许在观测值未连接的点之间显示协方差项。

使用该选项时，必须固定至少一个水平控制点和一个垂直控制点。

如果执行自由平差（即没有固定坐标的平差），不能用使用缩小的圆柱剖面图选项。对于自由平差，平差形式对话框一般标签内的切换被忽略，并且进行平差时不使用缩小的圆柱剖面。

观测线协方差项约束

选择该检查框限制显示协方差项。选择该选项不影响最终的平差结果，只是避免了在观测值未连接的点之间显示协方差项。

清除了检查框后，协方差项在网中每个可能的排列点对间被计算出来。对于大网，平差报告中的协方差项列表会变得很长。

计算大地水准面模型的相互关联

在平差中使用大地水准面观测值时，保持垂直坐标（高度和高程）固定。这样就会存在超量解，可以计算出被约束点的大地水准面残差。

为大地水准面模型校验框选择了计算相互关联后，带有非约束垂直坐标的点的大地水准面残差就用点间的大地水准面模型相互关联计算出来。

清除了检查框后，残差只计算带有固定高度和高程的点。

残差限差

用这些选项控制网平差处理期间使用的残差限差。更多信息，请参见残差限差。

Sigma 标量

从列表中选择选项，设置一元变量和二元变量的 sigma 标量。更多信息，请参见Sigma标量。

最大叠代

平差试图收敛网时，输入允许的最大叠代数。缺省的最大叠代数是10。


    残差限差

更多信息

 亦请参见

综述

这些选项控制网平差期间使用的残差限差。网平差是一个叠代过程。为了收敛，要基于下列残差限差来检查每个平差叠代：

结束叠代

输入用来决定平差叠代是否继续进行的残差限差。

每个平差叠代进行完毕后，一个观测值残差就被两个不同的软件例行程序计算出来。两个计算的差值与结束叠代限差相比较。根据比较，产生下列动作之一：

  如果计算出的观测值残差间的差值小于结束叠代限差，平差叠代将停止。网平差报告中将包含说明#次叠代中的平差已获成功的信息，其中的#是用来收敛网的叠代次数。

  如果计算出的观测值残差间的差值大于结束叠代限差，平差叠代将继续进行。如果平差继续到了最大叠代数，最终收敛角截止项就被使用（见下述内容）。

最终收敛角截止

为网平差的最终叠代输入收敛角截止限差。软件用该值确定：在最终叠代不通过结束叠代限差时，网平差是否成功。

最后一次平差叠代后，如果计算出的观测值残差间的差值大于结束叠代限差，残差就与最终收敛角截止进行比较，产生下列动作之一：

  如果计算出的观测值残差间的差值小于最终收敛角截止，平差即获成功。一条说明##次叠代（用最终收敛角截止）后最终收敛角截止已获成功的信息将显示出来，其中的##是用来收敛网的叠代次数。

  如果观测值残差大于最终收敛角截止，平差失败。一个说明平差失败、不能收敛的警告对话框出现。

这些信息也写到网平差报告中。

在最大叠代域中输入的值决定了出现最终叠代的时间。改变叠代或结束叠代和最终收敛角截止的次数时要十分小心。


    Sigma 标量

更多信息

 亦请参见

综述

这些选项设置一元变量和二元变量sigma标量。一元变量 sigma 标量应用到所有的一维误差、观测值内的传播误差、坐标分量和水平精度中。二元变量sigma 标量应用到所有的二维误差椭圆中。

所有传播误差都缺省地显示在2-sigma标准误差中，这等同于一元变量和二元变量Sigma标量的95%置信程度 。

以下选项可以用：

一元变量

用这个列表选择应用到观测值、坐标分量和水平精度中所有传播误差的一元变量sigma标量。它们都是单一维数误差。

对于美国、Bomford和Spherical方法，以下选项可以用：

  1.000 (68%)

  1.646 (90%)

  1.960 (95%)

  2.575 (99%)

二元变量

用这个列表选择应用到所有误差椭圆的二元变量标量。误差椭圆是二维误差的图形显示。

以下选项可以用：

  1.000 (39%)

  2.147 (68%)

  2.447 (95%)

  3.035 (99%)


    编辑平差形式对话框 - 协方差显示标签

更多信息

如何做 ...	对话框	亦请参见
综述

用这个标签为网平差形式定义二维和三维协方差显示选项。

如果要查看编辑平差形式对话框的协方差显示标签：

1.	要访问网平差形式对话框，选择平差 / 平差形式。网平差形式对话框出现。

2.	从形式列表选择形式。

3.	单击编辑。编辑平差形式对话框出现。

4.	选择协方差显示标签。协方差显示选项出现。

以下选项可以用：

水平

用这些选项为网平差形式定义二维协方差显示选项。更多信息，请参见水平。

三维

用这些选项为网平差定义三维协方差显示选项。更多信息，请参见三维。


水平（协方差显示）
    水平(协方差显示)

更多信息

 亦请参见

综述

这些选项为平差定义二维协方差显示选项：

表示精度为

用这个列表定义把水平（2D）精度（P）表示为比例误差的方法。对于水平精度，距离是指点间的水平距离。

选择下列选项之一：

  PPM − 选择该选项用每百万分之X的单位表示水平精度。（其中，X = 距离 � P � 1.0e-06）。

  比率 − 选择该选项用X分之一的单位表示水平精度 (X = 距离� P)。

  无 − 选择该选项不激活水平精度显示。

注：精度用下列公式计算：

(E x S)2 = C2 + P2

式中：

E是传播线性误差

S是传播线性误差标量

C是常量误差项

P是精度

传播线性误差

用这个列表为网平差形式定义水平（二维）传播线性误差。不论是一元变量和二元变量Sigma标量，计算出的传播线性误差都在1-sigma中。

选择下列选项之一：

  美国 − 选择该选项来使用已平差水平(2D)距离或倾斜(3D)距离的标准误差。

  加拿大 − 选择该选项来使用2D或3D相对误差椭球的最大长半轴。

  Bomford − 选择该选项来使用2D或3D相对误差方差和的平方根。

  Spherical − 选择该选项来使用2D或3D相对标准误差的平均值。

常数项

常数项必须在项目属性的项目单元设置中指定。此项必须在0.0米（0.0 美制英尺）到0.1米（0.3 美制英尺）范围内。

线性误差标量

用这个列表把缩放精度的水平（二维）标量定义到期望的置信度。为了缩放协方差矩阵，传播线性误差需要自乘。

对于美国、Bomford和Spherical方法，选择下列选项之一：

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

对于加拿大方法，选择下列选项之一：

  1.000 (39%)

  2.147 (90%)

  2.447 (95%)

  3.035 (99%)


    三维(协方差显示)

更多信息

 亦请参见

综述

这些选项为平差定义三维协方差显示选项：

表示精度为

选择把三维 (3D) 精度（P）表示为比例误差的方法。对于三维精度，距离是点间的斜距。

选择下列选项之一：

  PPM − 选择该选项用每百万分之X的单位表示水平精度。（其中，X = 距离 � P � 1.0e-06）。

  比率 − 选择该选项用X分之一的单位表示水平精度 (X = 距离� P)。

  无 − 选择该选项不激活水平精度显示。

注：精度用下列公式计算：

(E x S)2 = C2 + P2

式中：

E是传播线性误差

S是传播线性误差标量

C是常量误差项

P是精度

传播线性误差

用这个列表为网平差形式定义三维传播线性误差。

不论是为一元变量或二元变量Sigma标量指定的值，计算出的传播线性误差都在1-sigma中。

选择下列选项之一：

  美国 − 选择该选项来使用已平差的（水平(2D)距离或倾斜(3D)距离）误差。

  加拿大 ? 选择该选项来使用2D或3D相对误差椭圆的最大长半轴。

  Bomford ? 选择该选项来使用2D或3D相对误差方差和的平方根。

  Spherical ? 选择该选项来使用2D或3D相对标准误差的平均值。

常数项

常数项必须在项目属性的项目单元设置中指定。此项必须在0.0米（0.0 美制英尺）到0.1米（0.3 美制英尺）范围内。

线性误差标量

用这个列表把缩放进动的三维标量选择到期望的置信度。为了缩放相关的协方差矩阵, 传播线性误差需要自乘。

对于美国、Bomford和Spherical方法，选择下列选项之一：

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

对于加拿大方法，选择下列选项之一：

  1.00 (20%)

  2.50 (90%)

  2.80 (95%)

  3.37 (99%)

可能时使用高程误差

计算三维(3D)精度时，用这个检查框确定是否可以用高程误差或椭球高度误差。

用高程误差设置该检查框可以计算三维精度，或清除该检查框来应用三维精度计算中的椭球高度误差。

设置了该检查框后，高程误差只用于装载了大地水准面观测值的计算，并且可以计算高程。该检查框被缺省设置。如果您对固定垂直控制点和选择的大地水准面模型的质量有把握，则让该检查框保持设置。

如果项目属性中没有选择大地水准面模型，则将使用三维精度计算中的椭球高度误差，并忽略该选项的设置状态。


    编辑平差形式对话框 - 安装错误标签

更多信息

如何做 ...	对话框	亦请参见
综述

用这个形式定义天线高度、天线对中、仪器高度和仪器对中(铅垂)内的已知误差。这些定义将应用到全球范围的所有观测值，以便补偿计算平差时的误差。

如果要查看编辑平差属性对话框的安装错误标签：

1.	要访问网平差形式对话框，选择平差 / 平差形式。网平差形式对话框出现。

2.	从形式列表中选择形式。

3.	单击编辑。编辑平差形式 对话框出现。

4.	选择安装错误标签。

在GPS组中，下列选项可以用：

天线高度误差

用这个域定义天线高度的估计误差。计算网平差时，估计误差将应用于全球范围的所有GPS观测值。

估计误差是基于测量工具类型和读取测量能力的。如果用钢带测定天线高度，容许的误差估计就略高于高度测量杆的误差。与柔软的钢带相比，杆是测量高度更严格的工具。

典型的天线高度估计误差在0.000到0.004 mm（0.000到0.013 sft）范围内。缺省值是0.000 m（0.000 sft）。

对中误差

用这个域定义在测量点上方对天线进行铅垂和水平时的对中估计误差。

计算网平差时，估计误差将应用于全球范围的所有GPS观测值。估计误差受测量点上三脚架放置的平稳程度和对中程度影响。

典型的对中误差在0.000到0.002 m（0.002～0.007 sft）范围内。缺省值是0.000 m（0.000 sft）。

在地面组中，下列选项可以用：

仪器高度误差

用这个域定义仪器高度或目标高度的估计误差。计算网平差时，估计误差将应用于全球范围的所有地面观测值。

估计误差是基于测量工具类型和读取测量能力的。典型的仪器高度估计误差在0.000到0.004 m（0.000到0.013 sft）范围内。缺省值是0.000 m（0.000 sft）。

对中误差

用这个域定义在测量点上方对仪器或目标进行铅垂和水平时的对中估计误差。

计算网平差时，估计误差将应用于全球范围的地面观测值。估计误差受测量点上三脚架放置的平稳程度和对中程度影响。

典型的对中误差在0.000到0.002 m（0.002～0.007 sft）范围内。缺省值是0.000 m（0.000 sft）。


    新形式对话框

更多信息

如何做 ...	对话框	亦请参见
综述

使用这个对话框创建新的网平差形式。

如果要查看新形式对话框：

1.	要访问网平差形式对话框，选择平差 / 平差形式。网平差形式对话框出现。

2.	单击新建。新形式变为激活形式，新形式对话框出现。

下面选项可以用：

名称

选择这个域键入新网平差形式名称。名称可以包括最多255个字符，但短名称容易在形式列表中查找。如果命名了形式后要查看编辑平差形式对话框，单击确认。您可以使用该对话框编辑形式控制。


    复制形式对话框

更多信息

如何做 ...	对话框	亦请参见
综述

使用这个对话框并基于另一个网平差的复制形式，创建新的网平差形式。

如果要查看复制形式对话框：

1.	要访问网平差形式对话框，选择平差 / 平差形式。网平差形式对话框出现。

2.	从形式列表选择一个现有形式进行复制。

单击复制。

已复制的形式成为激活形式，复制形式对话框出现。

下面选项可以用：

名称

选择这个域键入新网平差形式名称。名称可包括最多255个字符，但短名称容易在形式列表中查找。如果命名了形式后要查看编辑平差形式对话框，单击确认。您可以使用该对话框编辑形式控制。

从形式列表选择的文件复件将用新名称创建。名称可包括最多255个字符，但短名称容易在形式列表中查找。如果命名了形式后要查看编辑平差形式对话框，单击确认。您可以使用该对话框编辑形式控制。


    重命名形式对话框

更多信息

如何做 ...	对话框	亦请参见
综述

使用这个对话框重命名网平差形式。

如果要查看重命名形式对话框：

1.	要访问网平差形式对话框，选择平差 / 平差形式。网平差形式对话框出现。

2.	从形式列表选择需要重命名的形式。

单击重命名。

重命名形式对话框出现。

下面选项可以用：

名称

在该域输入网平差形式的新名称。名称可包括最多255个字符，但短名称容易在形式列表中查找。


编辑平差形式对话框 - 地面控制标签
编辑平差形式对话框 − 地面控制标签

更多信息

 对话框

综述

用这个平差形式定义地面误差的估计和控制。下列栏目可以使用：

栏目	显示内容
测量值	地面测量值可以使用，包括：   水平角度   斜距   垂直角度   高程变化量   水平杆读取   大地水准面差距   方位角
缺省标准误差	在观测值没有提供标准误差时所用的标准误差。
最小绝对标准误差	绝对的最小标准误差。当大于提供的标准误差时，这些误差就被使用。
最小比例标准误差	比例的最小标准误差。当绝对误差成分和比例误差成分之和大于提供的标准误差时，这些误差就被使用。 注：比例误差只存在于斜距中。
选择下面一个检查框，指定要在地面观测值执行的平差类型：

  执行垂直平差

  执行水平平差


添加转换组观测值

 综述及更多信息

观测值能够随时添加到用户定义的转换组。不再需要时，可以被删除。

提示：单击筛选器，显示带有选项的观测值筛选对话框，以便在可用观测值列表中筛选观测值类型。

提示：也可以把栏目移到新的位置、重新设定栏目的大小来显示较多或较少信息以及按升序或降序排序。

1.	选择平差 / 观测值组/ 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

注：不能编辑大地水准面缺省转换组。

3.	选择转换组。

4.	单击编辑。带有已选组观测值显示的编辑转换组对话框出现在组观测值列表中。

5.	从可用观测值列表选择一个观测值。

6.	单击添加。观测值添加到组观测值列表中。

7.	单击确认，这一改变被保存。


添加方差组观测值

 综述及更多信息

观测值能够随时添加到方差组。不再需要时，可以被删除。

提示：单击筛选器，显示带有选项的观测值筛选对话框，以便在可用观测值列表中筛选观测值类型。

提示：也可以把栏目移到新的位置、重新设定栏目的大小来显示较多或较少信息以及按升序或降序排序。

要添加观测值：

1.	选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS、地面或大地水准面标签。

注：不能编辑大地水准面缺省方差组。

3.	选择希望改变的组。

4.	单击编辑。编辑方差组对话框出现。组观测值列表显示该组的当前观测值，可用观测值列表显示所有激活的项目观测值。

5.	在可用观测值列表中单击要添加到组中的观测值。

6.	单击添加。观测值添加到组观测值列表中，并且从可用观测值列表中删除。

7.	单击确认，这一改变被保存。


应用加权策略

 综述及更多信息

加权策略能够应用到平差的下一个叠代中。

要应用加权策略：

1.	选择平差 / 加权策略。加权策略对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	编辑加权策略。

4.	单击应用。新的加权策略将应用到下一个平差叠代中。

5.	单击确认，对话框关闭。


改变转换参数值

 综述及更多信息

警告：改变转换参数值域要非常谨慎。尝试这些改变前要具备足够的网平差理论和最小二乘平差知识。

注：方位旋转、网尺度、距离尺度和距离常量等参数不用于大地水准面转换。这些域是可编辑的GPS和地面观测值。

要改变参数值：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	选择希望改变的组。

4.	单击编辑。编辑转换组对话框出现。

5.	为希望的转换参数选择数值 域。

6.	输入新的参数值。

考虑以下原则：

  角度值输入为带符号的DDD.MMSSssss格式。

  线性值输入到带符号的项目单元中。

下面的主题包含了改变单个转换参数数值 和状态 的原则：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高度常数

7.	从状态列表选择用户定义的选项。更多信息，可从上述主题中选择。

必要时，重复步骤1到7来更改附加转换参数值。要创建期望的转换，可能需要更改几个参数的值和状态。

单击确认。

改变被应用到转换组中。


清除点的固定状态以删除坐标分量约束
清除点的固定状态以便删除坐标分量约束

固定状态设置用来把点列表中单个的点限制到坐标分量中，这些状态设置能被有选择地清除。

要清除固定状态设置：

1．选择平差 / 点。点对话框出现。

2．用滚动条查找期望的点。

3．选择点。

4．在固定选项组中，清除可应用的检查符号来删除分量约束。

5．单击确认。

改变被应用到项目中。


复制网平差形式

可以复制现有形式来创建新形式。为新形式定义的网平差设置将与原始形式的相同。只要形式被复制，平差设置就能被自定义。

要复制形式：

1．选择平差 / 平差形式。网平差形式 对话框出现。

2．单击复制。复制形式 对话框出现。

3．在名称域中键入新形式名 。

4．单击确认。编辑平差形式 对话框出现。

5．编辑形式设置。

6．单击确认。新形式被保存。


创建网平差形式

新的平差形式可以用二种方法创建。本主题提供的方法是在95%置信度的平差形式设置基础上创建新形式。另一个主题可用于把现有形式的设置复制到新形式。

提示：可以编辑新形式，使平差设置符合要求，并能够在创建时应用到新形式中。

要创建新形式：

1.	选择平差 / 平差形式。网平差形式 对话框出现。

2.	单击新的。新形式 对话框出现。

3.	在名称域中，输入新形式名。形式名可以包括最多255个字符，但短的文件名更容易在形式列表中找到。

4.	单击确认。编辑平差形式 对话框出现。

5.	选择下面标签之一：

  一般

  协方差显示

 地面控制

  安装错误

6.	编辑期望的形式控制。

7.	单击确认，保存新形式。


创建转换组

 综述及更多信息

可以为网平差创建一个或多个转换组。一旦创建，组就添加到组列表中。

注：只能创建GPS或地面观测值的新转换组，不能创建多重大地水准面转换组。

要创建新转换组：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS或地面标签。

3.	单击新建。新转换组对话框出现。

4.	在名称域中键入组名。

5.	单击确认。带有这些选项的编辑转换组对话框出现。

6.	把可用观测值列表中的观测值添加到组观测值列表中。

7.	为组定义转换参数，或者把它们设置为计算。

提示：可以筛选列表来暂时隐藏观测值类型，使列表变小。这样可以加快查找观测值的速度。

要筛选观测值：

1.	单击筛选器。观测值筛选对话框出现。开始时，所有观测值类型的检查框都被选择，可用观测值列表中的所有观测值都可见。

2.	要隐藏观测值类型，则清除任何检查框的组合。筛选动作只影响当前的编辑。对话框关闭时，筛选器重新设置到初始值。

要添加观测值：

1.	从可用观测值 列表选择观测值。添加钮变为可用。

注：转换域识别那些与观测值有关联的转换组，该域可用作添加观测值期间的向导。单个观测值只可分配到除<GPS 缺省>或<地面缺省>以外的转换组。但是，组的观测值能传输到激活组中，方法是：选择这些观测值，单击添加。所有GPS观测值仍然分配到<GPS 缺省>，即使添加到另一个转换组。同样，所有地面观测值仍然分配到<地面缺省>，即使添加到另一个转换组。

2.	单击添加。

观测值加到组观测值列表中。

要删除观测值：

1.	从组观测值列表选择观测值。删除钮变为可用。

2.	单击删除。

观测值便从组观测值列表删除。

注：删除的观测值状态在可用观测值列表中发生变化。观测值的转换域被清除，使得观测值可以添加到其它转换组中。

注：观测值不能从<GPS 缺省>、<地面缺省> 或 <大地水准面缺省> 转换组中删除。

要定义转换参数：

警告：改变转换参数值或状态时要非常谨慎。尝试这些改变前要具备足够的网平差理论和最小二乘平差知识。要得到关于网平差理论和最小二乘平差的更多系列资料，请参考参考资料。

1.	为期望的参数选择数值 域。

2.	用下面一项主题中的原则编辑域：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高度常数

注：方位旋转、网尺度、距离尺度和距离常量等参数不能用于大地水准面转换。

3.	从状态 列表选择适当的选项。要得到更多信息，请参见上述主题。

要保存改变，单击确认。


创建方差组

创建新方差组能在平差之间随时进行。

注：只能创建GPS或地面观测值的新方差组，不能创建多重大地水准面方差组。

要创建新方差组：

1.	选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS或地面标签。

3.	单击新建，创建方差组。新方差组对话框出现。

4.	输入新组名。

5.	单击确认。编辑方差组对话框出现。可用观测值列表用来选择添加到新组的观测值。

6.	选择期望的观测值。

提示：单击筛选器，显示带有选项的观测值筛选对话框，以便在可用观测值列表中筛选观测值类型。

7.	单击添加。

8.	重复步骤1到7，直到完成创建组。

9.	单击确认。改变被保存到项目中。


定义转换参数

 综述及更多信息

警告：改变转换参数值域要非常谨慎。尝试这些改变前要具备足够的网平差理论和最小二乘平差知识。

要改变参数值：

1.	选择平差 / 观测值组 / 转换组。转换组 对话框出现。

2.	选择期望的组。

4.	选择编辑。编辑转换组 对话框出现。

5.	为希望的转换参数选择数值 域。

6.	输入新的参数值。

考虑以下原则：

  角度值输入为带符号的DDD.MMSSssss格式。

  线性值输入到带符号的项目单元中。

下面的主题包含了改变单个转换参数值和状态的原则：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高度常数

注：方位旋转、网尺度、距离尺度和距离常量等参数不能用于大地水准面转换。

7.	从列表中选择转换参数状态 。要得到更多信息，请参见上述主题。

8.	必要时，重复步骤2到7来改变附加转换参数值。

9.	要创建期望的转换，可能需要更改几个值和状态域。

10.	单击确认。

改变被应用到转换组。


删除转换组

 综述及更多信息

不再需要时，用户定义的转换组可以被删除。删除后，组就从项目中移除，不再可以访问。

注：<GPS 缺省>、<地面缺省>和<大地水准面缺省>转换组不能被删除。当除了缺省组以外没有其它任何组出现在列表中时，删除将按钮自动禁用。

要删除观测值：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	选择组。

4.	单击删除。确认删除动作的信息出现。

5.	单击确认。


删除方差组

 综述及更多信息

不再需要时，方差组可以被删除。删除后的方差组从项目中移除，不再可以访问。

注：<GPS 缺省>、<地面缺省>和<大地水准面缺省>方差组不能被删除。当除了缺省组以外没有其它任何组出现在列表中时，删除将按钮自动禁用。

要删除组：

1.	选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	选择期望的组。

4.	单击删除。确认删除动作的信息出现。

5.	单击确认。


删除网平差形式

不再需要时，网平差形式可以被删除。删除后的网平差形式从项目中移除，不再可以访问。

注：形式列表中至少要有一个形式存在。当只有一个形式存在于列表中时，删除将按钮自动禁用。如果想删除最后一个形式，并用另一个形式替换它，单击新建来创建新形式。新形式是基于95%置信度的形式之上的。要得到更多信息，请参见创建网平差形式。

要删除形式：

1.	选择平差 / 平差形式。网平差形式 对话框出现。

2.	从形式列表中选择形式。

3.	单击删除。确认删除动作的信息出现。

4.	单击确认。


从平差或重新计算中禁用观测值

 综述及更多信息

如果不想在网平差或重新计算中使用观测值，可以把它禁用。禁用是从观测值对话框删除它，但并不从项目中永久删除其数据。

禁用观测值的方法有两种。

从观测值对话框禁用观测值：

1.	选择平差 / 观测值。观测值对话框出现。

2.	选择GPS或地面标签。

3.	滚动查找期望的观测值。

提示：可以在可用观测值列表中采用显示或隐藏已选观测值类型的方法来筛选观测值，这样能够使查找变得容易。

4.	用鼠标右键单击观测值，访问快捷菜单并选择禁用。观测值从列表中删除，并且将不再用于将来的网平差和重新计算。

图形窗口中的观测值被禁用后变成红色。删除后的网平差形式从项目中移除，不再可以访问。

5.	单击确认，把变化保存到项目中。

从图形窗口禁用观测值：

1.	双击观测值。属性窗口 出现。

2.	单击总结页 [image] 菜单钮。总结页出现。

3.	在状态列表中，选择禁止。

如果想重新激活禁用的观测值，必须在图形窗口中编辑观测值属性。

注：禁用观测值不同于排除观测值。与禁用观测值相同的是：排除观测值不用于网平差或重新计算。但它们仍然出现于观测值列表中，观测值数据不从项目中永久删除。所以可以再次使用已排除的观测值。


编辑协方差显示平差形式选项

 综述及更多信息

编辑协方差显示设置能在平差之间随时进行。

要编辑协方差显示设置：

1.	选择平差 / 平差形式。网平差形式 对话框出现。

2.	从形式列表中选择形式。

3.	选择编辑。编辑平差形式 对话框出现。

4.	根据需要，在协方差形式 标签中编辑下列选项：

  水平

  三维

5.	编辑完选项后，单击确认。改变被应用到平差形式中。


编辑一般平差形式选项

编辑一般选项能在平差之间随时进行。

要编辑一般设置：

1.	选择平差 / 平差形式。网平差形式 对话框出现。

2.	从形式列表选择形式。

3.	选择编辑。编辑平差形式 对话框出现。

4.	在一般标签中，选择或清除下列检查框：

  使用缩小的圆柱剖面图

  把协方差项限制到已观测线

  计算大地水准面模型的相关性

5.	编辑残差限差选项。

编辑 Sigma 标量选项。

在最大叠代域中输入新值。

8.	单击确认，保存改变。


编辑地面控制形式选项

 综述及更多信息

编辑地面控制选项能在平差之间随时进行。

方法是：

1.	选择平差 / 平差形式。网平差形式 对话框出现。

2.	从形式列表选择形式。

3.	选择编辑。编辑平差形式 对话框出现。

4.	在地面控制 标签中，编辑相关测量值的标准误差。

5.	选择或清除执行垂直平差检查框。平差3D导线或水平数据时选择该选项。

6. 	选择或清除执行水平平差检查框。平差3D导线时选择该选项。

7. 	单击确认，保存改变。


编辑转换组

 综述及更多信息

编辑GPS或地面转换组时，有几个操作可以执行。包括给组添加观测值、从组删除观测值和定义转换参数。编辑大地水准面转换组限于转换参数的定义范围内。

要编辑GPS、地面或大地水准面转换组：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择 GPS、地面或大地水准面标签。

3.	选择转换组。

4.	选择编辑。编辑转换组对话框出现。

5.	添加或删除观测值（见下述内容）。（只是GPS或地面）

6.	定义转换参数（见下述内容），或把它们设置为计算。（GPS、地面或大地水准面）

要在GPS转换中筛选观测值：

1.	单击筛选器。观测值筛选对话框出现。开始时，所有观测值类型检查框都被选择，使可用观测值列表中的所有观测值都可见。

2.	清除任何检查框组合，隐藏观测值类型。该筛选动作只影响当前的编辑。对话框关闭时，筛选重置到初始值。

要添加GPS或地面观测值：

1.	从可用观测值列表中选择观测值。该观测值被突出显示，添加钮变为可用。

注：可用观测值列表的转换域可识别那些与观测值已经相关的转换组。添加观测值时，可使用该域作向导。单个观测值只能分配给一个转换组。

2.	单击添加。

观测值添加到组观测值列表中。

要从转换组删除GPS或地面观测值：

1.	从组观测值列表选择观测值。该观测值被突出显示，删除钮变为可用。

2.	单击删除。观测值从组观测值列表中删除。

注：观测值不能从<GPS 缺省>、<地面缺省>或<大地水准面缺省>转换组中删除。

注：已删除观测值的状态在可用观测值列表中发生变化。观测值的转换域被清除，使得观测值可以添加到其它转换组中。

要为GPS、地面或大地水准面转换组定义转换参数：

警告：改变转换参数值或状态时要非常谨慎。尝试这些改变前要具备足够的网平差理论和最小二乘平差知识。要得到关于网平差理论和最小二乘平差的更多系列资料，请参考参考资料 。

1.	为期望的参数选择数值 域。

2.	用下面一项主题中的原则编辑域：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高度常数

注：方位旋转、网尺度、距离尺度和距离常量等参数不能用于大地水准面转换。

3.	从状态 列表中选择适当的选项。要得到更多信息，请参见上述主题。

4.	单击确认，把改变保存到项目中。


编辑方差组

 综述及更多信息

编辑方差组能在平差之间随时进行。

注：缺省大地水准面转换组的编辑钮只允许查看组。

要编辑组：

1.	选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	选择期望的组。

4.	选择编辑。编辑方差组对话框出现。组观测值列表显示组中的观测值，可用观测值列表显示所有激活的网平差观测值。

要添加观测值：

1.	从可用观测值列表中选择观测值。该观测值被突出显示，添加钮变为可用。

2.	单击添加。

观测值添加到组观测值列表中，并从可用观测值列表中删除。

要删除观测值：

1.	从组观测值列表选择观测值。该观测值被突出显示，删除钮变为可用。

2.	单击删除。

观测值从组中删除，并进入可用观测值列表。

要保存观测值：

  单击确认。

改变被保存到项目中。


编辑点列表中的坐标

 综述及更多信息

可以编辑平差间点列表中的点坐标。

1.	选择平差 / 点。点对话框出现。

2.	用滚动条查找要编辑的点。

3.	选择要编辑的坐标分量。

编辑坐标分量时，该分量（在固定组中）的检查框就被自动选择。

如果固定组里的分量未被选择，坐标分量将返回到编辑发生前存储在域中的值上。

4.	重复前面步骤，编辑更多的点。

5.	完成编辑后，单击确认。

这些改变保存到已选择的项目中（即：WGS-84、格网或当地）。


编辑加权策略

 综述及更多信息

加权策略可以在平差间定义和应用。

要编辑加权策略：

1.	选择平差 / 加权策略。标量加权对话框出现。

2.	选择GPS、地面或大地水准面标签。GPS、地面或大地水准面观测值列表出现。

3.	对所有观测值、每个观测值或方差组设置应用标量到选项。

注：所有观测值是唯一可用于大地水准面转换组的选项。

4.	 进行如下一项操作：

  如果在先前的步骤中选择了所有观测值或每个观测值，则跳到步骤6。

  如果选择了方差组，则执行步骤5。

注：如果选择每个观测值按钮，用户定义的标量类型就不可用。

5.	如果在步骤3选择了方差组，观测值列表就被组列表替换，所有方差组都被显示出来。执行下列步骤：

a.	设置标量类型到缺省、可选择、用户定义或自动。

b.	进行如下一项操作：

  如果选择了缺省、可选择、或自动，则转到步骤8。

  如果选择了用户定义，则光标出现在组列表的标量域中，您可以输入标量值。

c.	输入标量值后，进行步骤8。

6.	设置标量类型到缺省、可选择、用户定义或自动。

7.	进行如下一项操作：

  如果选择了缺省、可选择、或自动，则转到步骤8。

  如果选择了用户定义，则标量值域中变为可用，这时可以输入标量值。然后进行下一步。

8.	单击确认或应用。

改变被保存。


编辑安装错误平差形式选项

 综述及更多信息

编辑安装错误选项能在平差之间随时进行。

要编辑安装错误选项：

1.	选择平差 / 平差形式。网平差形式 对话框出现。

2.	从形式列表中选择形式。

3.	选择编辑。编辑平差形式 对话框出现。

4.	选择安装错误标签。安装错误选项出现。如果必要，进行以下操作：

a.  在天线高度误差或仪器高度误差域中输入新值。

b.  在对中误差域中输入新值。

5.	改变完成后，单击确认。


把观测值包括到平差中

 综述及更多信息

以前从网平差中排除的观测值能再回到网平差中。

要包括观测值：

1.	选择平差 / 观测值。观测值对话框出现。

2.	选择GPS、地面或大地水准面标签。观测值列表出现。

3.	用滚动条查找观测值。

4.	在使用栏中选择检查框来包括网平差中的观测值。

提示：可以用转换键或控制键选择多重观测值。

5.	单击确认。

改变被保存到项目中。

注：有关从平差中排除观测值的详情，请参见排除平差。

注：观测值也能被禁用和重新激活。更多信息，请参见禁用观测值和重新激活禁用的观测值。

注：也能用属性窗口来包括平差中的观测值。方法是：在总结页的网平差检查框中选择使用。


评估网平差报告

 综述及更多信息

随着平差的连续执行，结果可在网平差报告中查看。根据对报告结果的评估，可以采取一些动作，使网逐渐收敛。以下动作可能需要改变平差形式：包括或排除观测值、激活或禁用观测值、装载大地水准面差距、创建转换组并应用转换到观测值组、创建方差组、应用加权策略、约束控制点到坐标分量，以及其它动作。

要评估报告：

1.	选择报告 / 网平差报告。产生报告，运行计算机缺省的HTML查看器，使您能用查看器查看报告。

2.	访问报告来查看选择的统计，并评估结果。

下面主题提供了评估报告统计的总原则。更多信息，请参考参考资料 。

评估报告各部分的原则包括在下面主题内：

  平差形式设置

  残差限差

  协方差显示

  地面控制

  安装错误

  统计总结

  叠代次数

  全球统计

  GPS 观测值统计

  大地水准面模型统计

  地面观测值统计

  加权策略

  已平差坐标

  格网坐标

  大地坐标

  坐标变化量

  控制坐标比较

  已平差观测值

  GPS 观测值

  大地水准面观测值

  地面观测值

  标准残差柱状图

  点误差椭圆

  协方差值


筛选观测值

 综述及更多信息

查看大量GPS或地面观测值类型时此筛选起作用。当观测值对话框打开时，可以临时筛选观测值。筛选动作有效地隐藏了选择的观测值类型，使列表看起来更小。当观测值列表被筛选后，‘已筛选’一词便在对话框主题中出现。每当退出对话框，筛选的观测值就被清除。

要筛选观测值：

1．选择平差 / 观测值。观测值对话框出现。

2．选择GPS或地面标签。观测值列表出现。

3．单击筛选器。观测值筛选对话框出现。

4．选择或清除相应的检查框。所有筛选检查框都被缺省选择。

在地面观测值筛选中，要保留所有已选的观测值，除非对想选择的观测值类型确实有把握。选择一个选项与选择部分观测值相同。例如，如果选择椭球距离筛选器，那么只能得到包括椭球距离的观测值。得不到带有水平角和椭球距离的观测值，除非同时选择这两个筛选器选项。

  如果选择方位角检查框，并清除其它观测值检查框，则只有键入方位角的观测值被显示。

  如果选择高程变化量检查框，并清除其它观测值检查框，则只有水平数据被选择。

  如果想查看原始观测值，则选择水平角度、椭球距离和三角高程检查框。

5．单击确认。选择的观测值类型从视图中隐藏，但仍然用在网平差中。


筛选纯量加权观测值
筛选标量加权观测值

 综述及更多信息

查看大量GPS或地面观测值类型时此筛选起作用。当观测值对话框打开时，可以临时筛选观测值。筛选动作有效地隐藏了选择的观测值类型，使列表看起来更小。当观测值列表被筛选后，‘已筛选’一词便在对话框主题中出现。每当退出对话框，筛选的观测值就被清除。

要筛选观测值：

1．选择平差 / 加权策略。加权策略对话框出现。

2．选择GPS或地面标签。观测值列表出现。

3．单击筛选器。观测值筛选对话框出现。所有筛选检查框都被缺省选择。

4．选择期望的检查框来筛选可用观测值列表。选择检查框，清除检查标记。清除全部检查标记可以隐藏所有观测值。

在地面观测值筛选中，要保留所有已选的观测值，除非对想选择的观测值类型确实有把握。选择一个选项与选择部分观测值相同。例如，如果选择椭球距离筛选器，那么只能得到包括椭球距离的观测值。得不到带有水平角和椭球距离的观测值，除非同时选择这两个筛选器选项。

  如果选择方位角检查框，并清除其它观测值检查框，则只有键入方位角的观测值被显示。

  如果选择高程变化量检查框，并清除其它观测值检查框，则只有水平数据被选择。

  如果想查看原始观测值，则选择水平角度、椭球距离和三角高程检查框。

5．单击确认。选择的观测值类型从视图中隐藏，但仍然用在网平差中。


筛选转换组观测值

 综述及更多信息

查看大量变化的GPS或地面观测值时此筛选起作用。当观测值对话框打开时，可以临时筛选观测值。筛选动作有效地隐藏了选择的观测值类型，使列表看起来更小。当观测值列表被筛选后，‘已筛选’一词便在对话框主题中出现。每当退出对话框，筛选的观测值就被清除。

要筛选观测值：

1．选择平差 / 观测值组 / 转换组。转换组对话框出现。

2．选择GPS或地面标签。可用观测值列表出现。

3．单击筛选器。观测值筛选对话框出现。所有筛选检查框都被缺省选择。

4．选择期望的检查框来筛选可用观测值列表。选择检查框，清除检查标记。清除全部检查标记可以隐藏所有观测值。

在地面观测值筛选中，要保留所有已选的观测值，除非对想选择的观测值类型确实有把握。选择一个选项与选择部分观测值相同。例如，如果选择椭球距离筛选器，那么只能得到包括椭球距离的观测值。得不到带有水平角和椭球距离的观测值，除非同时选择这两个筛选器选项。

  如果选择方位角检查框，并清除其它观测值检查框，则只有键入方位角的观测值被显示。

  如果选择高程变化量检查框，并清除其它观测值检查框，则只有水平数据被选择。

  如果想查看原始观测值，则选择水平角度、椭球距离和三角高程检查框。

5．单击确认。选择的观测值类型从视图中隐藏，但仍然用在网平差中。


筛选协方差组观测值

 综述及更多信息

查看大量变化的GPS观测值时此筛选起作用。当观测值对话框打开时，可以临时筛选观测值。筛选动作有效地隐藏了选择的观测值类型，使列表看起来更小。当观测值列表被筛选后，‘已筛选’一词便在对话框主题中出现。每当退出对话框，筛选的观测值就被清除。

要筛选观测值：

1．选择平差 / 观测值组 / 协方差组。方差组对话框出现。

2．选择GPS或地面标签。可用观测值列表出现。

3．单击筛选器。观测值筛选对话框出现。所有筛选检查框都被缺省选择。

4．选择期望的检查框来筛选可用观测值列表。选择检查框，清除检查标记。清除全部检查标记可以隐藏所有观测值。

在地面观测值筛选中，要保留所有已选的观测值，除非对想选择的观测值类型确实有把握。选择一个选项与选择部分观测值相同。例如，如果选择椭球距离筛选器，那么只能得到包括椭球距离的观测值。得不到带有水平角和椭球距离的观测值，除非同时选择这两个筛选器选项。

  如果选择方位角检查框，并清除其它观测值检查框，则只有键入方位角的观测值被显示。

  如果选择高程变化量检查框，并清除其它观测值检查框，则只有水平数据被选择。

  如果想查看原始观测值，则选择水平角度、椭球距离和三角高程检查框。

5．单击确认。

选择的观测值类型从视图中隐藏，但仍然用在网平差中。


装载大地水准面差距

 综述及更多信息

计算点的高程或固定高程前，必须把大地水准面模型分配到项目中，必须把大地水准面差距装载到项目中。

典型地，大地水准面差距是在产生了每一点坐标之后装载的。使用的选项是定义大地水准面基准的完全约束平差。

注：这有助于使文件用大地水准面观测值术语来描述用于网平差的大地水准面差距。装载到项目中的大地水准面观测值只用于平差。

要装载大地水准面差距：

1.	选择平差 / 观测值。观测值对话框出现。

2.	选择大地水准面标签。

3.	进行下列操作之一：

  如果先前已经装载了大地水准面差距，观测值就将显示在观测值列表中，此时可以停止该步骤。

  如果观测值列表是空的，说明大地水准面差距没有装载到项目中，就应该完成该步骤。

4.	单击装载。所有对应点的大地水准面差距装载到项目中，并显示在观测值列表中。

注：如果没有为项目定义大地水准面模型，装载钮将被禁用。

注：大地水准面观测值是插到当前点位置的。如果点位置明显改变，则应该重新装载大地水准面观测值。

5.	单击确认。

改变被保存。


移动列表栏目

 综述及更多信息

观测值列表的栏目可以移到该表的新位置。

要移动栏目：

1.	在观测值列表中的栏目标题上移动光标。标题包括栏目主题，并位于第一行数据上方。

2.	进行下列操作之一：

  如果向右移动栏目，右拖标题直到其左侧边超过您想插入栏目的位置，然后放开鼠标按钮。

  如果向左移动栏目，左拖标题直到其右侧边超过您想插入栏目的位置，然后放开鼠标按钮。


访问网平差报告

 综述及更多信息

在计算机的缺省HTML查看器中查看了报告后，用查看器命令访问报告。

按照以下原则进行：

  用目录超链接移动到单个报告部分。

  用HTML查看器命令返回到页顶端。大多数查看器都有实现此功能的返回钮。

  用 Page Up 和 Page Down 键或滚动条访问报告各部分。

  按 Alt+Tab 键在Trimble Geomatics Office软件和HTML查看器之间来回切换。


删除网平差

 综述及更多信息

用这个命令使网返回到开始平差之前的相同配置上。

要删除已平差值，选择平差 / 删除平差。

使用该命令时：

  基准设置到WGS-84

  所有点都没有固定状态

  误差椭圆已删除

  大地水准面观测值已卸载

  如果校正在网平差之前出现，则校正被再次应用

  已平差坐标已删除

注：被平差禁用的观测值将不复位。


删除校正坐标

 综述及更多信息

删除了最小约束平差后，校正坐标保存在项目中。

要删除校正坐标，选择平差 / 校正坐标 / 删除。

校正坐标即从项目中删除。


删除转换组观测值

 综述及更多信息

观测值可以从用户创建的GPS或地面转换组中删除。

注：观测值不能从<大地水准面缺省>转换组删除。

要从GPS转换组中删除观测值：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS或地面标签。

3.	选择组。

4.	选择编辑。编辑转换组对话框出现。

5.	从组观测值 列表选择期望的观测值。删除钮变为可用。

6.	单击删除。观测值从组中删除，并出现在可用观测值 列表中。

7.	单击确认。

改变保存到项目中。


删除方差组观测值

 综述及更多信息

观测值可以从GPS或地面方差组中删除。

注：观测值不能从<大地水准面缺省>方差组删除。

要删除观测值：

1.	选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS或地面标签。

3.	选择期望的组。

4.	选择编辑。编辑方差组对话框出现。

5.	从组观测值中选择期望的观测值。该观测值被突出显示，删除钮变为可用。

6.	单击删除。观测值从组中删除，并出现在可用观测值列表中。

提示：可以筛选可用观测值列表。筛选动作有效地隐藏了选择的观测值类型，使列表看起来更小。列表中出现的观测值越少，查找速度越快。

7.	单击确认，应用改变。


重命名网平差形式

 综述及更多信息

平差形式能够随时在平差间重命名。

要重命名形式：

1.	选择平差 / 平差形式。网平差形式对话框出现。

2.	从形式列表中选择期望的形式。

3.	单击重命名。重命名形式 对话框出现。

4.	在名称域中键入新形式名。

5.	单击确认。

改变被保存，返回到网平差形式对话框。


重设列表栏目尺寸

 综述及更多信息

观测值列表里的栏目可以重设尺寸来显示或隐藏信息。

要重设栏目尺寸：

1.	把光标移到期望的栏目标题右边侧，直到出现重设尺寸光标为止。标题包含栏目主题，并位于数据的第一行上方。

2.	拖栏目标题的左侧或右侧，得到希望的宽度。栏目宽随着标题的移动而增加或减小。

现在栏目已被重设尺寸。


保存校正坐标

 综述及更多信息

完成了带有WGS-84基准上GPS数据的最小约束平差并在网平差的每个点上建立了WGS-84坐标后，这些坐标就能用作点校正的已观测GPS坐标。

校正坐标由WGS-84纬度、经度和椭球高度构成。

注：只有选择WGS-84作为平差基准时，这个命令才可用。平差只用GPS数据执行。

保存校正坐标：

1.	选择平差 / 校正坐标 / 保存。保存校正坐标对话框出现。

2.	选择在现有点下创建坐标选项，或选择在带有后缀的新点下创建坐标选项。

3.	单击确认。

校正坐标校准坐标被保存，并可以在属性窗口中查看。


选择平差基准

 综述及更多信息

在平差期间，可以为平差结果设置基准定义。该设置不改变项目属性对话框中的项目基准。在最小约束的GPS平差期间，典型地是把基准设置到WGS-84。在地面数据的最小约束平差之前，把基准设置到项目基准。一经为完全约束平差作好准备，就可以把基准设置到项目基准。

1.	要查看基准子菜单，选择平差 / 基准。带有下列选择的菜单出现：

  WGS-84

  项目基准 − <基准名称>

2.	选择基准。


设置固定状态到约束坐标

固定设置能够用来约束包括在网平差内的点坐标分量。

注：在点对话框中固定点坐标分量(2D、高度、高程)时，已平差坐标就被创建。可以在属性窗口中查看已平差坐标。

要设定固定设置：

1.	选择平差 / 点。点对话框出现。

2.	用滚动条查找期望的点，然后选择点。

3.	编辑坐标分量时，分量自动固定在固定选项组中。

注：能够识别那些在固定栏目中已经由（NE、e、h）输入的控制坐标的点。括号表示点还没有被固定。

注：如果清除已被固定的坐标分量，则坐标分量复原到旧的坐标值（即：改变回编辑前对话框里值）。

注：可以随时清除固定设置，释放分配给点的坐标约束。

4.	单击确认。

改变保存到项目中。


排序列表栏目

 综述及更多信息

观测值或点列表可以按升序或降序排序。

开始时，观测值列表用显示在列表顶端的残差排序。点列表首先按固定点附近排序。根据栏目内容，可以单击任何栏目标题，按升序或降序排序列表。

要排序栏目：

1.	在栏目标题上移动光标。标题包括栏目主题，并位于第一行数据上方。

2.	如果按升序排序，单击鼠标左键。

重复上述步骤，可以使栏目返回到降序排序。可以有选择地按照升序或降序排列其它栏目。排序可方便查找数据，尤其是当列表包括大量数据时。


平差网

 综述及更多信息

网平差是一个由最小约束平差开始、然后连续平差随后叠代处理的过程。下面给出了开始进行平差的基本原则，以及其它主题的参考资料，其中包括更多的、使网逐渐收敛的执行动作特别指令。

在开始第一个平差前，回顾下列主题：

1.	平差基准

2.	网平差形式

3.	观测值

4.	点

5.	固定 点

6.	包括 和 排除

7.	设置标量加权策略

8.	装载 和 卸载 大地水准面差距

9.	创建 或 编辑 方差组

10.	创建 或 编辑 转换组

平差

按照下列步骤进行平差：

1.	开始平差，进行下列操作之一：

  选择平差 / 平差。

  按F10。

网平差进行中的过程信息在状态条中显示，平差结果在图形窗口中显示。

2.	完成平差后，查看网平差报告，评估结果。

报告包括平差期间产生的数据以及平差是否成功的信息。


卸载大地水准面差距

 综述及更多信息

可以从平差卸载大地水准面差距。

注：大地水准面差距只能从平差中卸载，不能从项目中卸载。但大地水准面仍然可以为项目所选择，并用于重新计算。

注：这有助于文件用‘大地水准面观测值’术语描述用在网平差中的大地水准面差距。

要卸载大地水准面差距：

1.	选择平差 / 观测值。观测值对话框出现。

2.	选择大地水准面 标签。

3.	要决定差距是否能卸载，进行下列操作之一：

  如果观测值列表是空的，大地水准面差距就不能装入项目，您可以就此停止操作。

  如果大地水准面差距以前已经装载，观测值将在观测值列表中显示出来，您可以完成此步骤。

4.	单击卸载。大地水准面差距从平差中卸载，观测值列表被清除。

5.	单击确认。

改变被保存。


使用GPS测量数据

 综述及更多信息

Trimble Geomatics Office软件能与Trimble GPSurvey中的数据一起使用，但需要一个额外的导入步骤。必须把基线解算文件（.ssf 和 .ssk）导入到项目中，然后用Trimble Geomatics Office软件调整这些基线（观测值）。也可以用GPSurvey中产生的ASCII文件导入已知控制点。

要导入GPSurvey数据：

1.	创建新的Trimble Geomatics Office软件项目。选择与GPSurvey项目相同选择的项目属性。

2.	要选择导入命令，选择文件 / 导入。

3.	选择测量数据标签。

4.	选择SSF / SSK文件(*.ssf, *.ssk)。

5.	单击确认。

6.	访问包含期望文件的 \GPSurvey\Projects\*Projectname*\Trimvec 文件夹。

7.	突出显示期望的文件。

8.	单击打开。导入开始，基线显示在屏幕上。

9.	用导入对话框的自定义标签来导入ASCII文件，步骤同上。

现在，导入附加的GPS数据并开始在Trimble Geomatics Office软件中平差已经准备就绪。


检验转换参数

 综述及更多信息

转换参数能随时在平差间检验。

要检验转换参数：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	在列表中滚动查找期望的组。

4.	选择组。

5.	选择编辑。编辑转换组对话框出现。

组名称域显示分配给组的名称。可以从组观测值列表查看组内的观测值，从可用观测值列表查看可用项目观测值。转换参数列表左上方显示当前转换参数设置。

6.	在转换参数列表中检验转换参数。

7.	如果必要，编辑转换参数。

下列主题给出了定义转换参数的原则：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高度常数

8.	要编辑对话框，进行下列操作之一：

  如果只检验转换参数，单击删除。改变不被保存。

  如果编辑转换参数，单击确认，改变将被保存。


查看x平方测试结果

 综述及更多信息

x平方测试是对网参考因子（RF）和自由度的评估。如果RF接近1.0，自由度就可接受，并且网在数学上适配，那么网平差应该通过x平方测试。

要查看x平方测试结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端有平差标题的网平差报告出现。

2.	在屏幕左侧的目录上单击统计总结。x平方测试域出现。

3.	结束此部分后，退出查看器。


查看控制点固定状态

可以在平差间查看网平差包括的控制点固定状态。

1.	选择平差 / 点。点对话框出现。

2.	用滚动条查看控制点。

当出现的检查标记被清除时，控制点坐标分量的固定状态就被设置。同时，对应的坐标分量出现在固定栏，或括号从控制质量点的标识符删除。

3.	单击删除。改变不保存到项目中。

注：坐标质量也能从属性窗口查看。如果点有固定状态，它显示为固定控制。


查看自由度

 综述及更多信息

用这些统计查看网的冗余量。

要查看自由度值：

1.	要查看报告，选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端有平差标题的网平差报告出现。

2.	在屏幕左侧的目录上单击统计总结。

自由度域位于这个报告部分。

3.	结束此部分后，退出查看器。

该域显示了包括在平差中用来超量确定解算的独立观测值数目。数目越大越好，只要所有观测值都是独立的。更多信息，请参见主题选择独立基线。

4.	结束此项操作后，退出HTML查看器。


查看网参考因子

 综述及更多信息

这个值表示了平差后验误差与观测值残差的匹配程度。即：网参考因子可使您知道这些观测值的随机误差与估计误差的匹配程度。

如果查看网参考因子值：

1.	要查看报告，选择报告 / 网平差报告。

缺省的HTML查看器开始运行，顶端有平差标题的网平差报告出现。

2.	在屏幕左侧的目录上单击统计总结。

网参考因子域位于这个报告部分。

3.	结束此操作后，选择命令来退出HTML查看器（通常用文件 / 退出）。


查看网平差报告

 综述及更多信息

完成平差后，查看网平差报告。

1.	要查看报告，选择报告 / 网平差报告。网平差报告在计算机的缺省HTML查看器中显示。

2.	用以下原则查看平差结果：

  单击屏幕左侧的超链接，移动到报告部分。

  用HTML查看器命令返回到页顶端。大多数HTML查看器都有返回钮。

  用 Page Up 和 Page Down 键、滚动条或其它HTML查看器命令在报告中访问。

  按Alt+Tab，在HTML查看器和Trimble Geomatics Office软件之间转换。每次按 Alt+Tab 时，就循环到下一个打开的窗口。

  缺省的HTML查看器是单独的应用程序，可以在任务条上把它最小化，并返回到Trimble Geomatics Office软件，以便基于评估来改变平差。然后，可以把HTML查看器窗口调到最大来返回到报告中，并执行进一步评估。这个过程可以为当前报告的评估重复任意多次。

  如果要为评估而打印报告，用HTML查看器的打印命令（通常是文件 / 打印）打印。

  为了归档，可以把报告写成文件，或日后把报告打印成文件。

  如果有 Adobe� Acrobat�，则可以把报告打印到文件，然后提取文件，得到可视的、超链接编制的报告文件。

  用HTML查看器的电子邮件命令可以把报告发送到别处。实践证明，对于实时应用，把报告发送到野外流动观测站，这种方法是有用的。此外，对于从野外把报告数据传输到档案中心，这种方法也是有用的。

3.	关闭HTML查看器。


查看为平差选择的观测值

 综述及更多信息

查看观测值列表可用来检查用于平差中观测值：

1.	选择平差 / 观测值。观测值对话框出现。

2.	选择GPS、地面或大地水准面标签。选择的观测值列表出现。

3.	使用滚动条访问列表。

4. 	查看完观测值后，单击删除。

改变不保存到项目中。


查看转换组观测值

 综述及更多信息

查看转换组观测值能随时在平差间进行。

要查看转换组观测值：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	在列表上滚动，选择期望的组。

4.	选择编辑。编辑转换组对话框出现。

组名称域显示分配到组的名称。可以从组观测值列表查看组中的观测值，也可以从可用观测值列表查看可用的项目观测值。

5.	查看了组观测值后，单击删除。

改变将不保存在项目中。


查看转换组

 综述及更多信息

查看转换组能随时在平差间进行。

要查看转换组：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	在列表上滚动，查找期望的组。

4.	选择该组。

5.	选择编辑。编辑转换组对话框出现。

组名称域显示分配给组的名称。可以从组观测值列表查看组内的观测值，从可用观测值列表查看可用项目观测值。转换参数列表左上方显示当前转换参数设置。

提示：也可以在项目属性窗口中，用详细坐标系统标签的平差标签查看转换参数。

6.	查看组之后，单击删除。

改变不保存到项目中。


查看转换参数

 综述及更多信息

转换参数可以在平差间查看。

提示：也可以从项目属性窗口，用详细坐标系统标签的平差标签查看转换参数。

要查看转换参数：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	从列表选择期望的转换组。

4.	选择编辑。编辑转换组对话框出现。

转换参数列表位于组名称域下面的对话框左上侧。

有关个别参数的详情，请看下列主题：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高度常数

注：方位旋转、网尺度、距离尺度和距离常量等参数不能用于大地水准面转换。

更多信息，请参见转换参数。


查看方差组观测值

 综述及更多信息

按照下列步骤查看大地水准面或GPS观测值方差组。

1.	选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择 GPS、地面或大地水准面标签。

3.	选择方差组。

4.	选择编辑。带观测值列表的编辑方差组对话框出现。

5.	在观测值列表上移动滚动。

6.	单击取消。改变不保存到项目中。


包括网平差中的基线

 综述及更多信息

无论什么原因，如果基线从网平差删除，其属性可能会改变，使之包括在今后的网平差中。

注：为在网平差中使用，基线也必须被激活。

要在今后的网平差中包括基线：

1.	双击基线。属性窗口出现。

2.	在属性窗口中，打开总结页 。

3.	在网平差检查框选择使用，从而把基线包括在今后的平差中。

4.	完成改变后，单击确认。


删除来自网平差的观测值

 综述及更多信息

改变观测值属性，能够从今后的网平差删除观测值。

方法是：

1.	双击观测值。属性 窗口出现。

2.	单击总结页 [image] 按钮。在总结页中，如果基线包括在今后的网平差内，网平差检查框的使用就被选择。

3.	清除该检查框。观测值将从今后的网平差中删除。

4.	完成改变化后，单击确认。

注：也可以从观测值对话框的网平差删除观测值。


从网平差排除观测值

 综述及更多信息

导入观测值时，所有可平差的观测值都已被标记。但是，个别的观测值能用观测值对话框从平差中排除。排除观测值并不从项目删除它。

要排除观测值：

1.	选择平差 / 观测值。观测值对话框出现。

2.	选择GPS或地面标签。

3.	在观测值列表中，确定要排除观测值的位置。

提示：可以筛选可用观测值列表中的观测值，从而显示或隐藏观测值类型。隐藏选择的观测值类型可临时减小列表尺寸，这样更容易查找观测值。

4.	确认观测值使用栏目里的检查框被清除。

5.	排除观测值后，单击确认，把改变保存到项目中。

注：从平差中排除观测值的另一个方法是：在属性窗口的总结页中，清除网平差选项中的使用。

从平差中排除的观测值能够被再次包括。

注：观测值也可以被禁用和重新激活。更多信息，请参见禁用观测值和重新激活禁用的观测值。


重新激活禁用的平差观测值

 综述及更多信息

从观测值对话框或图形窗口禁用的观测值可以被重新激活。一旦重新激活，观测值就出现在观测值对话框，并可以用于今后的网平差和重新计算。

注：重新激活观测值与包括观测值是两个不同的操作。已排除的观测值可以包括在今后的网平差中，方法是：在观测值对话框中选择平差的使用检查框，或者在属性窗口总结页中的网平差检查框中选择使用。禁用的观测值不能从观测值对话框重新激活，它们必须通过选择观测值并从图形窗口查看属性视窗来重新激活。更多信息，请参见包括平差中的观测值。

要从图形窗口激活观测值：

1.	双击观测值。在图形窗口中，禁用的观测值是红色的。

2.	属性 窗口出现。

3.	单击总结页  [image] 按钮，打开总结页。

4.	在状态列表中，选择使能。

5.	确认网平差检查框里的使用被选择。

6.	观测值被重新激活，并将用于今后的网平差和重新计算。在图形窗口中，观察不再是红色。

注：有关包括和排除观测值的详情，请参见包括观测值和排除观测值。


组合网平差中不同的观测值类型

可以对网平差中的 GPS、地面和大地水准面观测值进行组合，从而产生一套已平差坐标。

为了组合观测值，必须把地面观测值放入GPS网中。否则，执行平差时，一个错误信息可能会出现。为此，需要测量与GPS网共同的点的角度和距离。要用至少二个共同点（在GPS和地面数据集观测的点或控制点），并且这些点能把二个数据集连结到一起。这可以避免由一个点引起的、“悬空”GPS观测值的地面导线。

执行完全约束网平差之前，要检查每套观测值，以便于确定误差位置。也需要分别执行GPS和地面观测值的最小约束平差。

组合网平差中观测值的推荐方法包括几个基本步骤。下列各部分简单地概括了其工作流程。

1.  导入数据

a.	如果具有与项目关联的控制质量点，则首先导入这些点到Trimble Geomatics Office项目中。这可以保证这些控制坐标被用作重新计算的起始点。更多信息，请参见重新计算和网平差中坐标匀化的重要性。

b. 	导入 任何其它数据集到项目中。保证对任何错误标志都进行探查。

注：导入数据时，如果在重复点选项对话框里没有选择总是合并重复点选项，则需要合并重复点。

2.  准备 GPS 数据

如果在GPS观测值上执行最小约束平差，则进行如下步骤：

a.	在图形窗口中选择GPS数据。

b.	处理GPS数据 。

c.	执行GPS环闭合差 并查看环闭合差报告，以保证GPS观测值对平差适合。

d.	删除任何限差外标志。这些标志可能由不正确的控制坐标、错误天线高度或错误的点命名引起。

e.	选择独立的GPS基线 。

f.	选择WGS-84基准 。

g.	选择平差形式 。如果必要，改变平差形式设置。

h.	在观测值对话框的GPS标签中，选择要包括在平差内的观测值。

提示：用观测值对话框中的筛选器按钮筛选观测值类型。

i.	如果必要，为数据定义观测值组(方差和/或转换组)。

j.	在点对话框 中固定控制点。这是可选项。

k	设置加权策略 。（对初始平差，把观测值类型设置为所有观测值，把标量类型设置为缺省。）

l.	执行最小约束平差 。

m	在网平差报告 中查看平差细节。

n.	如果必要，把标量类型设置为可选择，执行进一步平差，并回顾网平差报告。进行此项操作，直到平差通过x平方测试，并且您对平差结果满意为止。

注：如果在加权策略对话框中选择自动标量类型选项，平差叠代将被执行，直到平差通过x平方测试为止。

o.	如果选择了可选择标量选项，当完成最后叠代时，锁闭加权策略对话框里的标量值。

p.	如果打算执行GPS点校正，则保存校正坐标。WGS-84坐标将被保存。

现在，GPS观测值准备好了完全约束平差。

3.  准备地面数据

如果要在地面数据上执行最小约束平差，进行下列操作：

a.	在图形窗口中选择地面观测值。

提示：可以用查看筛选器，只显示地面观测值。

b.	选择项目基准 。

c.	在观测值对话框的地面标签中，选择要包括在平差内的观测值 。

注：如果地面数据不包括闭合导线（即：地面观测值从GPS观测值网悬空），还需要装载大地水准面观测值，从而保证GPS和地面观测值能够用大地水准面链接到一起。如果把大地水准面数据合并到现阶段的地面的平差中，则不需要进行下面步骤4。

d.	如果必要，为数据定义观测值组(方差和/或转换组)。

e.	设置加权策略。对第一个平差，把观测值类型设置为所有观测值，把标量类型设置为缺省。

f.	在点对话框 中固定一个点。

注：为了执行已组合的平差，固定的点应该是在GPS和地面网之间的一个共同点。

g.	执行最小约束平差 。

h.	在网平差报告 中查看平差细节。

i.	如果必要，把标量类型设置为可选择，执行另一个平差，并回顾网平差报告。进行此项操作，直到对平差结果满意为止。

注：如果在加权策略对话框中选择了自动标量类型选项，平差叠代将被执行，直到平差通过x平方测试为止。

j.	如果已经使用了可选择标量选项，则锁闭加权策略对话框里的标量值。

现在，地面观测值准备好了完全约束平差。

4.	合并大地水准面观测值到平差中

大地水准面误差用观测值的约束平差衡量。如果要对大地水准面数据执行垂直约束平差，进行以下步骤：

a.	确认已为项目选择了大地水准面模型。方法是：在项目属性对话框中检查坐标系统细节。

b.	在观测值对话框中，选择大地水准面标签，装载大地水准面观测值。

c.	设置大地水准面加权策略。对于初始平差，设置标量类型为缺省。

d.	在点对话框中固定高程（和／或高度）。至少要有三个约束值。

e.	执行平差。

f.	在网平差报告中查看平差细节。

g.	如果必要，设置标量类型为缺省，执行另一个平差，并回顾网平差报告。进行此项操作，直到平差通过x平方测试、您对平差结果满意为止。

h.	如果已经使用了可选择标量类型选项，则锁闭加权策略对话框里的标量值。

5.	执行水平约束平差

一旦锁闭了最小约束平差中的误差标度，就可以执行完全约束平差。

方法是：

a.	确认项目基准仍被选择。

b.	在点对话框 中固定控制点。

注：为了执行已组合平差，应该固定至少二个GPS点。如果可能，这些点应该是GPS和地面网之间的共同点。

c.	执行平差。

d.	在网平差报告中查看平差结果。

如果必要，执行进一步平差，直到您对平差结果满意为止。

提示：如果平差不收敛，x平方测试将失败，或参考因子不被接受。那么，控制坐标可能会有问题。因此，要在点对话框解除固定点（每次一个），再次执行完全约束平差，直到您找到不良点。有关疑难解答的更多信息，请参考网平差用户指南。


在GPS观测值上执行网平差

下面简要总结了Trimble Geomatics Office软件中已平差GPS观测值的流程：

1.	导入控制数据

a.	如果具有与项目关联的控制质量点，则首先导入这些点到Trimble Geomatics Office项目中。这可以保证这些控制坐标被用作重新计算的起始点。更多信息，请参见重新计算和网平差中坐标匀化的重要性。

b.	导入 并检查进入项目的任何其它数据，然后探查任何错误标志。

注：导入数据时，如果在重复点选项对话框 里没有选择总是合并重复点选项，则需要合并重复点 。

2.	准备GPS数据

a.	处理GPS数据 。

b.	执行GPS环闭合差 并查看环闭合差报告，以保证GPS观测值对平差适合。

c.	删除任何限差外标志。这些标志可能由不正确的控制坐标、错误天线高度或错误的点命名引起。

d.	选择独立的GPS基线 。

e.	选择WGS-84基准 。

f.	选择平差形式 。如果必要，改变平差形式设置。

g.	在观测值对话框的GPS标签中，选择要包括在平差内的观测值。

提示：用观测值对话框中的筛选器钮筛选观测值类型。

h.	如果必要，为数据定义观测值组(方差和/或转换组)。

i.	在点对话框中固定控制点。这是一个可选项。

j	设置加权策略。（对初始平差，把观测值类型设置为所有观测值，把标量类型设置为缺省。）

执行最小约束平差 。

在网平差报告 中查看平差细节。

如果必要，把标量类型设置为可选择，执行进一步平差，并回顾网平差报告。进行此项操作，直到平差通过x平方测试，并且您对平差结果满意为止。

注：如果在加权策略对话框中选择自动标量类型选项，平差叠代将被执行，直到平差通过x平方测试为止。

如果选择了可选择标量选项，当完成最后叠代时，锁闭加权策略对话框里的标量值。

如果打算执行GPS点校正，则保存校正坐标。WGS-84坐标将被保存。

现在，GPS观测值准备好了完全约束平差。

3.	合并大地水准面观测值到平差中

大地水准面误差用观测值的约束平差衡量。如果要对大地水准面数据执行垂直约束平差，进行以下步骤：

a.	确认已为项目选择了大地水准面模型。方法是：在项目属性对话框中检查坐标系统细节。

b.	在观测值对话框中，选择大地水准面标签，装载大地水准面观测值。

c.	设置大地水准面加权策略。对于初始平差，设置标量类型为缺省。

d.	在点对话框中固定高程（和／或高度）。Trimble建议至少要有三个约束值。

e.	执行平差。

f.	在网平差报告中查看平差细节。

g.	如果必要，设置标量类型为缺省，执行另一个平差，并回顾网平差报告。进行此项操作，直到平差通过x平方测试、您对平差结果满意为止。

h.	如果已经使用了可选择标量类型选项，则锁闭加权策略对话框里的标量值。

4.	执行水平约束平差

一旦锁闭了最小约束平差中的误差标度，就可以执行完全约束平差。

方法是：

a.	确认项目基准仍被选择。

b.	在点对话框 中固定控制点。

c.	执行平差。

d.	在网平差报告中查看平差结果。

e.	如果必要，执行进一步平差，直到对平差结果满意为止。

提示：如果平差不收敛，x平方测试将失败，或参考因子不被接受。那么，控制坐标可能会有问题。因此，要在点对话框解除固定点（每次一个），再次执行完全约束平差，直到找到不良点。有关疑难解答的更多信息，请参考网平差用户指南。


在地面观测值上执行网平差

下面简要总结了Trimble Geomatics Office软件中平差地面观测值的流程：

注：如果打算用Trimble Survey Controller软件传输的数据执行网平差，则执行测量时，要确保在测量控制器测量形式内输入压力、温度、以及曲率和折射改正值。也需要为项目定义一个投影。

现在，GPS观测值准备好了完全约束平差。

1.	导入控制数据

a.	如果有与项目关联的控制质量点，则首先导入这些点到Trimble Geomatics Office项目中。这可以保证这些控制坐标被用作重新计算的起始点。更多信息，请参见重新计算和网平差中坐标匀化的重要性。

b.	导入 并检查进入项目的任何其它数据集。要确保错误标志被探查。

注：导入数据时，如果在重复点选项对话框 里没有选择总是合并重复点选项，则需要合并重复点 。

2.	准备地面数据

如果要在地面数据上执行最小约束平差，进行如下操作：

a.	导入并检查地面数据（要探查产生任何错误标志）。

b.	如果在项目中有重复点，并且在重复点选项对话框 里没有选择总是合并重复点选项，则需要合并重复点。

c.	选择项目基准 。

d.	在观测值对话框的地面标签中，选择要包括在平差中的观测值 。

e.	如果必要，为数据定义观测值组(方差和/或转换组)。

f.	设置加权策略。对第一个平差，把观测值类型设置为所有观测值，把标量类型设置为缺省。

g.	执行最小约束平差 。

h.	在网平差报告 中查看平差细节。

i.	如果必要，把标量类型设置为可选择，执行进一步平差，直到您对平差结果满意为止。

注：如果在加权策略对话框中选择自动标量类型选项，平差叠代将被执行，直到平差通过x平方测试为止。

j.	如果使用了可选择标量类型选项，则锁闭加权策略对话框里的标量值。

现在，地面观测值准备好了完全约束平差。

3．	执行水平约束平差

一旦锁闭了最小约束平差中的误差标度，就可以执行完全约束平差。方法是：

a.	确认项目基准仍被选择。

b.	在点对话框 中固定控制点。

c.	执行平差。

d.	在网平差报告中查看平差结果。

e.	如果必要，执行进一步平差，直到您对平差结果满意为止。

提示：如果平差不收敛，x平方测试将失败，或参考因子不被接受。那么，控制坐标可能会有问题。因此，要在点对话框“解除固定”点（每次一个），再次执行完全约束平差，直到找到不良点。有关疑难解答的更多信息，请参考网平差用户指南。


平差水准观测值

下面简要总结了在Trimble Geomatics Office软件中平差水准观测值的流程：

1．导入水准观测值

方法是：

a.	选择文件 / 导入。导入对话框出现。

b.	在测量标签中，选择数字水准文件(*.dat, *.raw)。打开对话框出现。

c.	选择要导入的数字水准文件。数字水准导入对话框 出现。用该对话框检查水准观测值。

d.	单击确认。

数字水准文件被导入。

注：也可以用Trimble Data Exchange Format人工地把高程变化量导入到项目中。

注：要查看水准报告中的水准信息，选择报告 / 水准报告。

2.  查看水准观测值

导入数字水准数据被后，通常没有与高程有关的水平坐标，所以不能在测量视图中查看它们（除非在项目里已经有点的水平坐标，并且重复点已经被合并）。但是，可以在属性窗口查看水准观测值。方法是：

a.	选择选择 / 全部。

b.	进行下列操作之一：

  选择编辑 / 属性。

  单击 Alt + Enter。

  从工具条选择属性窗口工具。

现在便可以查看水平观测值。

3.  执行最小约束平差

要平差水准观测值，步骤如下：

a.	选择项目基准 。

b.	选择网平差形式 。

c.	从观测值对话框 选择要包括在平差中的观测值。

提示：用观测值对话框里的筛选，只选择高程变化量观测值。

d.	在观测值对话框 � 大地水准面标签中，装载大地水准面观测值。

在观测值对话框的地面标签中，为数据定义观测值组(方差和/或转换组)。

设置地面加权策略。方法是：在加权策略对话框中选择地面标签。然后，在应用标量和标量类型组中选择适当选项。

在点对话框中固定一个点。

注：为了执行已组合的平差，固定的点应该是在GPS和地面网之间的一个共同点。

注：通常，该点是数字水准导入对话框 中定义高程的基站点。

h.	执行最小约束平差。

i.	查看网平差报告 中的平差结果。

j.	如果必要，执行进一步平差，直到对结果满意为止。

k.	如果已经使用了可选择标量类型选项，锁闭加权策略对话框里的标量值。

4. 执行完全约束平差

a.	确认项目基准仍被选择。

b.	在点对话框 中固定控制点。

c.	执行完全约束平差 。

d.	在网平差报告中查看平差结果。

e.	如果必要，执行进一步平差，直到您对结果满意为止。

完成平差后，一套已平差坐标就为平差的每个点所保存。您能够在属性窗口中查看这些坐标。


使用自动纯量类型
使用自动标量类型

在加权策略对话框中，可以从下列标量类型中进行选择：

  缺省

  可选择

  用户定义

  自动

开始平差时，为了把缺省标量类型应用到全部观测值，软件要设置加权策略。在平差中，缺省标量用1.00乘先验误差，保留误差估计不改变。如果观测值的估计误差与实际误差匹配，报告的参考因子就应该大约是1.00。否则，必须把估计误差缩放到实际误差。应用标量的最简单方法是选择可选择的标量类型。可选择的标量类型采用来自当前平差的参考因子，乘以先前的标量，来确定下一个平差的标量。这可使参考因子更接近于1.00。可选择标量应用到进一步的平差叠代，直到通过x 方测试为止。

如果选择自动标量选项，选择可选择标量类型的处理就是自动的。换句话说，直到x 方测试通过，平差才完成。这时，标量值被锁闭。

注：当选择自动标量类型时，网平差报告表明可选择标量类型已被选择。

故障检测的重要性

数据集里的故障引起平差中其它观测值（在相同组中）的过缩放，因此在使用自动标量类型时，要确保全部故障都被删除。

  可以通过采用缺省标量选项运行平差的方法，检查任何故障或错误数据。

注：误差标志也表示数据集中可能的误差。

使用自动标量类型选项之后，要认真检查平差结果，特别是平差柱壮图，从而保证故障没有隐藏在观测值中。

警告：Trimble建议不要用自动标量类型选项同时缩放GPS和地面观测值。


    点对话框 - 综述

更多信息

如何做...	亦请参见
综述

这个对话框用来查看、估算和约束平差里的点。点对话框里显示的坐标是当前点的坐标，它同显示在属性窗口总结页面里的坐标一样。平差后，点对话框就会显示平差坐标值。

注：如果点对话框内的点是被约束的（固定的），而且当前没有控制质量坐标存在，那么一个坐标就会为这个点储存下来。

要查看点对话框：

 选择平差 / 点。

以下选项有效：

平差基准

平差基准显示在点列表上方。

点

这个列表用来查看网平差内连接到观测值的点。这个列表并不反映包括在项目里的全部点列表。有关列表域的更多信息，请看点。

固定

这个检查框用来约束包含在平差里的每个单独点的坐标分量。更多信息，请看固定。

坐标视图

这个视图决定了储存在项目里的坐标类型。

格网 − 选择这个按钮来显示在项目属性对话框的坐标系统内设置的绘图投影坐标的点。这是一个缺省视图。

当地 − 选择这个按钮来显示设置在项目属性对话框里的项目基准地理坐标中的点。

WGS − 选择这个按钮来显示WGS-84地理坐标里的点。


    点

更多信息

如何做...	对话框	亦请参见
综述

这个列表只显示包含在网平差内的连接到观测值的点，它并没有反映包括在项目里的全部点列表。

列表里的每一行都包含一个点的数据。编辑点的坐标分量时，固定组的固定状态检查框就会被选择。如果检查框里的固定状态被清除，则编辑过的坐标分量就变回到原始坐标。

提示：列表里的每一栏都可以移动到新位置，调整栏目的尺寸大小可以显示更多或更少的信息，也可以按升序或降序来排序列表。

包括以下各栏目：

栏目	显示内容
点	分配给网平差里的点名称
北向或当地纬度或WGS-84 纬度	为项目选择的绘图投影上点的北向坐标，或者是项目（当地）或WGS-84椭球上点的纬度坐标。
东向或当地经度或WGS-84 经度	为项目选择的绘图投影上点的东向坐标，或者是项目（当地）或WGS-84椭球上点的经度坐标。
高度	项目（当地）或WGS-84椭球上方或下面的点的高度。数值用项目单位表示。
高程	平均海水面上方或下面的点的高程。这个高程在大地水准面差距被载入并运用后显示。数值以项目单位表示。
固定	点位置的每个分量的固定(约束)状态。任何带圆括号的坐标分量标识符或标识符组都表示一个点有控制质量坐标并且不固定。任何没带圆括号的坐标分量标识符或标识符组都表示坐标分量已经为点所固定。例如，如果一个分量包含标识符组 (NE, e)，这就意味着北坐标、东坐标和高程都有控制质量。
这些固定状态值可能出现在固定栏目里：

固定显示:	固定的内容:
____	点没有被任何分量约束
LL 或 NE__	水平位置被约束
__h_	高度被约束
___e	高程被约束
LL 或 NEh_	水平位置和高度被约束
LL 或 NE_e	水平位置和高程被约束
LL 或 NEhe	水平位置、高度以及高程被约束
__he	高度和高程被约束

固定一个点的坐标分量 (2D、高度、高程)，同时这个点没有控制质量坐标时，这个坐标在属性窗口里会被更新为与坐标视图一样的坐标类型。

坐标视图

这些按钮显示所选坐标系统里点的水平坐标分量。视图同时也控制保存已编辑坐标的方法。

格网 − 选择这个按钮，显示设置在项目属性对话框的系统坐标标签中的绘图投影坐标点。

当地 − 选择这个按钮，显示设置在项目属性对话框里项目基准地理坐标中的点。

WGS − 选择这个按钮，显示WGS-84 地理坐标里的点。


    固定

更多信息

如何做...	对话框	亦请参见
综述

这些检查框用来设置或清除点坐标分量的固定状态。

任何坐标点分量被约束时，检查标记就会出现；没有坐标分量被约束时，检查标记就会被清除。这些坐标分量包括2D (水平的)、高度(椭球)和高程(高程)。

包括以下选项：

2D

选择这个检查框，把点约束到北向 和东向或纬度和经度坐标分量。

该选项被选择时，点列表固定栏目里会显示固定状态。

高度

选择这个检查框，把高度约束在点的项目椭球上方或下面。这个选项被选择时，点列表的固定栏目里会显示固定状态。

高程

选择这个检查框来约束点的高程。这个选项只有在大地水准面差距被应用到项目观测值后才有效。数值用项目单位显示。这个选项被选择时，点列表的固定栏目里会显示固定状态。

注: 在WGS-84 基准里，不要固定超过一个格网坐标。

有关约束点坐标分量的更多信息，请看网平差 。


    观测值对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

观测值对话框包括GPS、地面和大地水准面标签。这些标签用来包含或排除网平差里的GPS、地面和大地水准面观测值，还用来查看平差的观测值残差。

要打开观测值对话框：

  选择平差 / 观测值。

在GPS和地面标签里，也可以禁用观测值。禁用观测值可以防止它被用在平差和重新计算里，也防止它出现在观测值列表里。

禁用了观测值后，不能从观测值对话框里重新激活它。更多信息，请看禁用观测值和重新激活禁用的观测值。

在大地水准面标签里，也可以装载或卸载大地水准面差距。

每个标签里包括以下这些选项：

观测值

这个列表显示GPS、地面或大地水准面观测值。不同的观测值列表会有不同的外观和内容。有关包含在每个列表里的栏目的更多信息，请看下列主题：

  观测值 (GPS)

  观测值 (地面)

  观测值(大地水准面)

筛选器

单击筛选器来显示带有筛选观测值选项的观测值筛选。更多信息，请看筛选观测值。

装载(只有大地水准面标签)

单击装载，从大地水准面模型里装载大地水准面差距。在这个按钮变为有效前，必须在项目属性对话框的坐标系统标签里选择一个大地水准面模型。

每个点的大地水准面模型和水平坐标用来为那一位置的大地水准面差距插值。通过装载大地水准面差距，使用观测的椭球高度和观测的大地水准面差距可以得到每个点的高程。典型地说，在每个使用完全约束平差（并且这个平差是用大地水准面模型的基准定义的）的点上生成坐标后，大地水准面差距就被装载。

更多信息，请看装载大地水准面差距。

卸载(只有大地水准面标签)

单击卸载，从项目中删除大地水准面差距。如果要在项目里再次使用大地水准面观测值，用装载按钮重新装载差距。这个按钮只有在选择大地水准面标签时才有效。

当没有在项目属性里选择大地水准面模型、或没有把大地水准面差距装载到项目时，这个按钮无效。

从项目中删除观测值时，观测值列表里的所有观测值都会被删除。

更多信息，请看卸载大地水准面差距。


    观测值(GPS)

更多信息

如何做 ...	对话框	亦请参见
综述

这个标签里的观测值列表用来：

 包含或排除GPS观测值

 查看观测值残差

 禁用观测值

这个列表只反映用在网平差里的观测值。只能编辑使用栏目，其他栏目仅供参考用。

提示：可以筛选这个列表里的观测值来显示任何RTK、静态、动态或连续的观测值的组合。筛选可以暂时隐藏某些观测值，这样更容易查找其它观测值。更多信息，请看筛选观测值。

包括以下各栏目：

栏目	显示内容
使用	选择或清除这个栏目里的检查框来包含一个观测值到网平差里、或从网平差排除一个观测值。用它可以识别列表中每个观测值的当前状态。  注：也可以用鼠标右键单击一个观测值，从而显示带有禁用观测值命令的菜单。禁用的观测值会从观测值列表删除，并且不能在平差里使用，直到它们被重新激活。禁用的观测值不能从观测值对话框重新激活。更多信息，请看重新激活禁用观测值。
观测值	分配给观测值的记录编号。有关GPS观测值类型的记录是以字母“B”起头的。
从点	观测值测量开始的那一点
到点	观测值测量完成的那一点
类型	采集观测值使用的测量方法。可能的数值是RTK、动态、静态或连续。
方差组	与观测值关联的方差组。（如果存在）
标准残差(最大)	观测值的标准化残差计算。

提示：您可以调整列表里的栏目尺寸，移动它们或为它们排序。


观测值(地面)

更多信息

 对话框

综述

这个标签里的观测值列表用来：

 包含或排除地面观测值

 查看观测值残差

 禁用观测值

只能编辑使用栏，其它栏目仅供查看用。

提示：可以筛选这个列表里的观测值来显示任何方位角、水平角、椭球距离、高程变化量或三角高程观测值的组合。筛选可以暂时隐藏某些观测值，这样更容易查找其它观测值。

在地面观测值筛选中，不要改动已选择的观测值，除非您对要选的观测值类型很有把握。选择一个选项，相当于选择一部分观测值。

例如，如果选择椭球距离筛选器，那么您只会看到包含椭球距离的观测值，不会看到既包含水平角又包含椭球距离的观测值，除非同时选择了这两个筛选选项。

  如果选择方位角检查框，并清除其它观测值的检查框，那么只有键入方位角的观测值会被显示。

  如果选择高程变化量检查框，并清除其它观测值的检查框，水准数据就会被选择。

  如果想查看原始观测值，就检查水平角、椭球距离和三角高程选项。

包含以下各栏目：

栏目	显示内容
使用	选择或清除这个检查框来包含观测值到网平差里，或从网平差排除观测值。用它来识别列表中每个观测值的当前状态。 注：也可以用鼠标右键单击观测值来显示带有禁用这个观测值命令的菜单。禁用的观测值会从观测值列表删除，并且不能在平差里使用，直到它们被重新激活。禁用的观测值不能从观测值对话框重新激活。更多信息，请看重新激活禁用观测值。
观测值	分配给观测值的记录编号。地面观测值类型的记录是以字母“T”起头的。
后视点	后视点名称。
测站点	测站点名称。
前视点	前视点名称。
方差组	任何与观测值关联的方差组。
标准残差(最大)	关于观测值的标准化残差计算。

提示：可以调整列表里栏目的尺寸，移动它们或为它们排序。

注：水准和方位角观测值被看作是地面观测值。对于这些观测值，测站点被看作是“从”点，前视点被看作是“到”点。


    观测值(大地水准面)

更多信息

如何做 ...	对话框	亦请参见
综述

这个标签里的观测值列表用来查看大地水准面观测值。只能编辑使用栏目，其他栏目仅供查看用。

平差里所有点的大地水准面差距会从当前的大地水准面模型里计算。

包括以下各栏目：

栏目	显示内容
使用	选择这个检查框来包含观测值到网平差里，或从网平差里排除观测值。查看它来决定观测值的当前状态。
观测值	分配给观测值的记录编号。大地水准面观测值类型的记录是以字母“G”起头的。
点	生成大地水准面观测值的点名称。
差距	高度（椭球）和高程（大地水准面）之间的差值。
误差	大地水准面观测值的标准误差。在大地水准面被装载时它被计算。要重写这个标准误差，请在网平差形式对话框里设置最小误差标准。
方差组	与观测值关联的方差组名称。在这个栏目里，大地水准面观测值只列出<大地水准面缺省>方差组。
标准残差	观测值的标准化残差计算。

提示：可以调整列表里栏目的尺寸，移动它们或为它们排序。


    观测值筛选对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

这个对话框用来筛选出现在有效观测值列表里的观测值类型。

要查看观测值筛选对话框：

  从任何含有有效观测值列表的对话框里单击筛选 。

所有筛选器都被缺省启用，这允许显示所有观测值类型和隐藏列表里的观测值类型。清除检查框标记可以禁用单个筛选器。以下表格显示了有效选项：

在地面观测值筛选里，不要改动已选择的观测值，除非对要选的观测值类型很有把握。选择一个选项相当于选择一部分观测值。例如，如果选择椭球距离筛选器，那么只会看到包含椭球距离的观测值。不会看到既包含水平角又包含椭球距离的观测值，除非同时选择了这两个筛选选项。

  如果选择方位角检查框，并清除其它观测值的检查框，那么只有键入方位角的观测值会被显示。

  如果选择高程变化量检查框，并清除其它观测值的检查框，水准数据就会被选择。

  如果想查看原始观测值，就选择水平角、椭球距离和三角高程检查框。


    方差组对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

方差组对话框包括GPS、地面和大地水准面标签。这些标签用来查看、创建、编辑和删除GPS观测值和地面观测值的方差组，或者用来查看大地水准面差距的缺省方差组。

要访问方差组对话框：

  选择平差 / 观测值组 / 方差组。

每个标签包括以下选项：

组

可以在编辑和删除方差组前选择这个列表。创建新的方差组时，选择项会添加到这个列表中。

选择GPS标签时，GPS观测值的方差组会被显示；选择地面标签时，地面观测值会被显示；选择大地水准面标签时，大地水准面观测值会被显示。

注：最初的<大地水准面缺省>组不含有观测值。只有在定义了项目属性里的大地水准面模型并且把大地水准面差距装载到项目后，观测值才会出现。

新建

这个按钮用来为项目创建新的方差组。

选择这个按钮后，新建方差组对话框出现，它带有一个给方差组分配名称的选项。单击确认创建新组时，带有给组添加GPS或地面观测值选项的编辑方差组对话框会显示出来。查看<大地水准面缺省>方差组时，这个按钮无效。

编辑

选择这个按钮来编辑从组列表选择的已有方差组。选择的组会被装载到编辑方差组对话框，在那里可以从组里添加或删除单个的观测值。

所有的GPS和地面方差组都能编辑，但大地水准面方差组只能查看。

删除

选择这个按钮，从组列表里删除选择的方差组。

选择了该按钮后，会出现一个要求确认删除方差组的信息。可以选择确认来继续操作，或选择取消来取消操作。

注：不能删除<GPS缺省>、<地面缺省>或<大地水准面缺省>方差组。

注：如果有超过很短线(< 25 米)的观测值，Trimble建议您为这些观测值创建一个单独的方差组，这样它们可以与别的观测值分开缩放。


    编辑方差组对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

编辑方差组对话框包括GPS、地面和大地水准面标签。这些标签用来查看和编辑方差组、GPS观测值、地面观测值和大地水准面差距。对于方差组，编辑过程就是添加和删除观测值的过程。

如果要查看编辑方差组对话框：

1.	要查看编辑方差组对话框，选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS、地面或大地水准面标签。

3.	选择需要的组。

4.	单击编辑。

编辑方差组对话框出现。更多信息，请看编辑方差组对话框。

每个标签包括以下选择：

组名称

查看这个域可以找到分配给方差组的名称。这一域只供参考不能被编辑。

组观测值

这个列表用来查看方差组里的观测值。它包括三个表格：一个关于GPS观测值，一个关于地面观测值，还有一个关于那些大地水准面差距为之存在的观测值。有关列表里各栏目的更多信息，请看下列主题：

  组观测值(GPS)

  组观测值 (地面)

  组观测值 (大地水准面)

有效观测值

这个列表用来查看包含在网平差里的所有GPS观测值。可以从这个列表里选择观测值并且添加到方差组里。所有的域只供参考不能被编辑。

  有效观测值 (GPS)

  有效观测值 (地面)

  有效观测值 (大地水准面)

注：在编辑<大地水准面缺省>方差组时，有效观测值列表会出现，但它不是激活的。

添加

选择这个按钮可以把观测值添加到方差组里。从有效观测值列表选择了观测值后，这个按钮才会有效。选择的观测值会添加到组观测值列表里。更多信息，请看添加观测值。

删除

选择这个按钮可以从方差组里删除观测值。在从组观测值列表选择了观测值时，这个按钮才会有效。而且只有编辑用户定义的方差组而不是缺省的方差组时，这个按钮才有效。更多信息，请看删除观测值。

筛选器

选择这个按钮来筛选有效观测值列表里的观测值。

带有筛选列表中观测值选项的观测值筛选对话框会显示出来。

在GPS观测值的编辑方差组对话框里，可以通过选择对话框里的选项来显示或隐藏RTK、动态、静态和连续的观测值类型组合。在地面观测值的编辑方差组对话框里，可以显示或隐藏任何方位角、水平角、椭球距离、高程变化量或三角观测值的组合。

更多信息，请看筛选观测值。


    组观测值(方差组 - GPS)

更多信息

如何做 ...	对话框	亦请参见
综述

这个列表用来查看方差组里的观测值。列表中的这个表格只为GPS观测值的方差组出现。

观测值可以添加到该列表或从该列表删除。所有的域只供参考不能编辑。当列表里的一个观测值被突出显示时，用来从列表里删除观测值的删除按钮就变为有效。更多信息，请看添加观测值和删除观测值。

包括以下各栏目：

栏目	显示内容
观测值	分配给项目里观测值的记录编号。
从点	观测值的起始点。
到点	观测值的结束点。
类型	采集观测值使用的方法。可能的数值是静态、动态、RTK和连续。

提示：可以调整列表里这些栏目的尺寸，移动它们或给它们排序。


    有效观测值(方差组 - GPS)

更多信息

如何做 ...	对话框	亦请参见
综述

这个列用来查看包含在网平差里的所有GPS观测值。可以从这个列表里选择观测值并把它们添加到方差组里。所有的域只供参考不能被编辑。

列表里的每一行代表一个观测值的方差组信息。使用这个列表作为添加观测值到方差组的来源。当列表里的一个观测值被选择时，用来添加观测值到组观测值列表的添加按钮就变为有效。

提示：可以使用筛选器按钮来显示任何RTK、动态、静态或连续的观测值组合。筛选会把有些观测值暂时隐藏，这样查看其它观测值就更容易。更多信息，请看筛选观测值。

包括以下各栏目：

栏目	显示内容
观测值	分配给项目里观测值的记录编号。
从点	观测值的起始点。
到点	观测值的结束点。
类型	采集观测值使用的方法。四个可能的数值是RTK、静态、动态和连续。
方差组	如果有观测值分配给方差组。

提示：可以调整列表里这些栏目的尺寸，移动它们或给它们排序。


    组观测值(方差组 - 大地水准面)

更多信息

如何做 ...	对话框	亦请参见
综述

列表中的每一行都是一个保存在项目里的观测值记录。不能编辑任何域。

包括以下栏目：

栏目	显示内容
观测值	保存在项目里的观测值数据的记录编号。
点	点的名称，坐标从该点提取模型里的大地水准面观测值。
差距	从大地水准面模型中得到的大地水准面观测值高度，该大地水准面模型是在项目属性里定义的。
误差	在大地水准面差距里估计的误差。

提示：可以调整列表里这些栏目的尺寸，移动它们或给它们排序。


    有效观测值(方差组 - 大地水准面)

更多信息

 亦请参见

综述

有效观测值列表被禁用，它不能被使用。


    新建方差组对话框

更多信息

如何做 ...	对话框	亦请参见
综述

这个对话框用来创建新的方差组。

注：大地水准面标签被选择时，这个按钮无效。因为给来自相同水准面模型的每个水准面观测值的插值方法相同，所以没有必要把它们分到多重的组里。

如果要查看新建方差组对话框：

1.	要查看新建方差组对话框，选择平差 / 观测值组 / 方差组。方差组对话框出现。

2.	选择GPS或地面标签。

3.	单击新建。

新建方差组对话框出现。

以下选项有效：

名称

在这个域内输入方差组名称。方差组名称可以包含最多24个字符，但是在组列表里，越简练的名称越容易找到。

在命名新建的方差组并单击确认后，带有添加和删除方差组观测值选项的编辑方差组对话框显示出来。更多信息，请看创建方差组。


组观测值 (方差组 - 地面)

综述

在这个组列表里，您可以在方差组里查看观测值。列表中的这个表格只会为地面观测值的方差组出现。

提示：观测值可以添加到该列表或从该列表删除。(当列表里的一个观测值被突出显示时，删除按钮就变为有效)。但您不能编辑任何域。更多信息，请看添加观测值和删除观测值。

包括以下各列：

栏目	显示内容
观测值	分配给项目里观测值的记录编号。
后视点	观测值后视点名称。
测站点	观测值测站点名称。
前视点	观测值前视点名称。

提示：可以调整列表里这些栏目的尺寸，移动它们或给它们排序。

注：水准和方位角观测值被认为是地面观测值。对于这些观测值，测站点被看作为“从”点，前视点被看作为“到”点。

注：创建地面方差组时，会为每个观测值类型创建一个差距组。例如，如果创建一个包含垂直角和距离观测值的地面方差组，那么一个地面方差组就会为角观测值创建，另一个地面方差组会为距离观测值创建。对于<地面缺省>方差组，这样的情况也会发生。


有效观测值(方差组 - 地面)

综述

在这个组列表里，可以查看包含在网平差里的所有地面观测值。每一行都代表一个观测值的方差组信息。可以从列表里选择观测值并添加到方差组里，但不能编辑任何域。

选择了列表里的观测值时，用来添加观测值到组观测值列表的添加按钮就变为有效。

提示：可以使用筛选器按钮来筛选观测值，并且显示任何方位角、水平角、椭球距离、高程变化量或三角高程的组合。筛选器会暂时隐藏一些观测值，这样查看其它观测值就更容易。更多信息，请看筛选观测值。

包括以下栏目：

栏目	显示内容
观测值	分配给项目里观测值的记录编号。
后视点	观测值后视点名称。
测站点	观测值测站点名称。
前视点	观测值前视点名称。
方差组	如果有观测值被分配到方差组。

提示：可以调整列表里这些栏目的尺寸，移动它们或给它们排序。


    转换组对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

转换组对话框用来为网平差创建、编辑和删除转换组。这个对话框包括GPS、地面和大地水准面标签。使用这些标签可以查看或选择GPS 观测值、地面观测值和大地水准面观测值的转换组。

要访问转换组对话框：

  选择平差 / 观测值组 / 转换组。

每个标签里包括以下选项:

组

这个列表用来选择GPS、地面或大地水准面测量值的转换组。

当选择GPS、地面或大地水准面标签时，组列表的内容就会改变。

三个缺省转换组(<GPS 缺省>组、< 地面缺省>组和<水准面缺省>组)会被自动创建。<水准面缺省> 组可能是空的，也可能包含所有那些造成大地水准面差距存在的观测值。

注:	如果没有为项目定义大地水准面模型，或者大地水准面模型差距还没有载入项目，那么<水准面缺省>组就会是空的。有关为项目定义大地水准面模型的信息，请参见坐标系统。有关从平差大地水准面模型中载入大地水准面差距的信息，请参见观测值。

标签列表用来选择GPS、地面或大地水准面转换组。GPS标签列出<GPS 缺省>组，以及为项目创建的任何其它用户定义的GPS组。地面标签列出< 地面缺省>组，以及为项目创建的任何其它用户定义的地面组。大地水准面标签只列出<水准面缺省>组，不能创建新的大地水准面组。

从列表中选择了组后，如果适用，可以从可用的按钮中选择其中一个来编辑或删除转换组。

新建

这个按钮用来创建新转换组。但该按钮对大地水准面组无效。

注:	<GPS 缺省>组、<地面缺省>组和<水准面缺省>组决不能删除。<水准面缺省>转换组是唯一的大地水准面转换组。不需要多重大地水准面转换组，因为大地水准面观测值只有一个来源：大地水准面模型。对于<水准面缺省>组，只有转换参数可以被编辑。

更多信息，请参见创建转换组。

编辑

这个按钮用来查看或编辑GPS、地面或大地水准面转换组。显示GPS、地面或大地水准面组列表时，该按钮总是有效。

选择了该按钮后，编辑转换组对话框就会出现，它包括添加或删除组观测值（只有GPS和地面）和编辑转换参数选项。

更多信息，请参见编辑转换组。

删除

这个按钮用来删除已选择的GPS、地面或大地水准面转换组。<GPS 缺省>组、< 地面缺省>组和<水准面缺省>组决不能从项目中删除。只有用户定义的GPS或地面转换组可以被删除。

注:	因为不能删除<水准面缺省>组，也不能创建新的大地水准面转换组，所以选择大地水准面转换组时，该按钮总是无效。

更多信息，请参见删除转换组。


    新转换组对话框

更多信息

如何做 ...	对话框	亦请参见
综述

新转换组对话框用来创建新的GPS或地面转换组。

注:	选择大地水准面标签时这个按钮无效。由于从同样的大地水准面模型中为每个大地水准面观测值插值采用的是同样的方法，所以不需要把它们分散到多重组里。

要访问它：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	选择GPS或地面标签。

3.	单击新建。

新转换组对话框出现。

有一个选项可用：

名称

把转换组名键入到这个域中。转换组名可以包含最多24个字符，但在组列表中越简练的描述就越容易查找。

命名新转换组并单击确认后，含有添加或删除转换组观测值和定义转换参数选项的编辑转换组对话框就会出现。更多信息，请参见创建转换组。


     编辑转换组对话框 - 综述

更多信息

如何做 ...	对话框	亦请参见
综述

编辑转换组对话框用来查看、编辑和核对GPS、地面或大地水准面观测值的转换组。

要访问它：

1.	选择平差 / 观测值组 / 转换组。转换组对话框出现。

2.	在GPS、地面或大地水准面标签里选择需要的组。

3.	单击编辑。

编辑转换组对话框出现。更多信息，请参见编辑转换组。

对于GPS和地面转换组，编辑是在组内添加或删除包含在网平差里的观测值以及定义转换参数的过程。因为大地水准面转换组包含了网平差中所有造成大地水准面模型差距存在的有效观测值，所以编辑被限制在定义转换参数上。

注:	如果没有为项目定义大地水准面模型，或者大地水准面模型差距没有被载入到项目，那么<水准面缺省> 组就会是空的。有关给项目定义大地水准面模型的信息，请参见坐标系统。有关从大地水准面模型载入大地水准面差距的信息，请参见观测值。

任何转换参数的组合都可以定义或计算，从而应用于转换组里的观测值转换。可以创建多重的GPS或地面转换组，而且不同的转换参数可以应用于这里的每一组。

警告：不恰当地应用转换可能对平差产生反作用。所以在进行观测值转换前，请核对所有转换参数。

以下选项可以使用：

组名称

这个域显示分配给转换组的名称。它只是用来作参考，不能编辑。

转换参数列表

这个列表用来定义、计算或排除转换参数。

下列参数可以被定义或计算：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高程常数

每个参数定义包括值域和状态列表。附加信息，请参考下列主题：

  数值

  状态

下列转换参数被缺省地设置到计算GPS观测值转换组：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

在缺省情况下，只有地面观测值的方位旋转被设置到计算。其它参数可以设置为用户定义或计算，但它们只在观测值发生系统误差时才使用。例如，如果一个平差在进行，所有的距离(由地面技术测量的)都有+3 ppm 的残差，那么距离尺度参数就不能被计算，因为在采集数据时有一个明显的系统误差。这个系统误差也许已经发生，因为EDM 上的ppm设置没有被应用。

注: 在大地水准面转换中，不使用方位旋转、网尺度、距离尺度和距离常数参数。

有关定义单独或整套转换参数的基本原则，请参见转换参数。有关转换观测值数据的技巧和实践的更多高级信息，请参见参考书目。

组观测值

这个列表显示包括在转换组里的GPS、地面或大地水准面观测值。根据观测值类型，该列表可能出现不同的变化。

更多信息，请参见下列主题：

  组观测值 (GPS)

  组观测值 (地面)

  组观测值 (大地水准面)

有效观测值

这个列表用来查看网平差里的所有观测值，以及作为来源添加到转换组里的所有观测值。所有的域都只是用来显示，不能编辑。

关于列表中域的更多信息，请参见以下主题：

  有效观测值 (GPS)

  有效观测值(地面)

  有效观测值(大地水准面)

注: 编辑<GPS 缺省>、<地面缺省>和<水准面缺省>转换组时，虽然有效观测值列表会出现，但它不激活。观测值不能从缺省的GPS、地面或大地水准面转换组里删除。

添加

这个按钮用来把观测值添加到组观测值列表里。当有效观测值列表里的观测值被选定时，这个按钮才有效。

删除

这个按钮用来从组观测值列表里删除观测值。

筛选器

这个按钮用来显示观测值筛选对话框，对话框包括一些有效观测值列表里筛选观测值类型的选项。


    数值（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

使用转换参数列表第二列里的这些域来查看或更改应用于每个转换参数里的值。

这个域指定了转换参数值，从状态列表选择的选项决定这个值的生成或不生成方法。

改变单个参数值或状态的原则列在下面主题中：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高程常数


    状态（转换参数）

更多信息

对话框	亦请参见
综述

使用转换参数列表第三列的这些域来选择决定转换参数值时使用的方法。

以下选项可用：

计算

这个选项允许Trimble Geomatics Office 软件把转换参数数值作为平差的一个部分来计算。如果平差包括足够的固定点约束(点固定到坐标分量 )，列表里的每个参数值都会被计算。关于约束坐标的更多信息，请参见点。

用户定义

用这个选项输入用户定义的转换参数值。如果参数值已知，该选项就作为状态被选择，而已知数值会输入到相关的数值域中。

警告：给该设置设定参数状态和输入用户定义参数值时要谨慎。有关定义单个参数值和状态的原则，请参见转换参数。

不使用

这个选项用来禁用转换参数值。如果一个值输入到数值域，这个选项就会使该数值被禁用。禁用的参数值在转换组里不会被计算或应用。这一设置是对所有参数的缺省设置。

警告：为转换参数值选择状态选项时要谨慎。不适当地应用转换参数值，可能对平差造成相反的影响。

选择个别参数状态选项的原则包括在下列主题中：

  经度偏差

  纬度偏差

  方位旋转

  网尺度

  距离尺度

  距离常数

  高程常数


    经度偏差（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来查看、核对或输入在第二条曲线中表示的、东西方向上的当地大地测量水平里的斜度。

经度偏差是用于基准转换的旋转角，有时(地面观测值)用来为观测的天文方位角计算拉普拉斯改正。如果使用该旋转角，则需要三个高度（高程和/或椭球），它们被固定在网中已知的(不必是固定的)水平位置上。这个角影响角度和线性、水平(高程变化量除外)和垂直观测值，而且与垂直偏差的一个分量对应。

更多信息，请参见定义转换参数。


    纬度偏差（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来查看、核对或定义用第二条曲线表示的、南北方向上的当地大地测量水平里的斜度。

纬度偏差是基准转换的一个旋转角，它用于从一个基准到另一个基准的观测值转换。如果使用该旋转角，则需要三个高度（高程和/或椭球），它们是固定在网中已知的(不必是固定的)水平位置上。这个角影响角度和直线、水平(高程变化量除外)和垂直的观测值，而且与垂直偏差的一个分量相对应。

更多信息，请参见定义转换参数。


    方位旋转（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来查看、核对、计算或输入法线周围每一点坐标系统的旋转角(在这种情况下，法线是在那一点垂直于椭球的线)，它用第二条曲线表示，用来说明平差基准到观测值基准的旋转。方位旋转用于基准转换，它只影响键入的方位角。

对于GPS 观测值，计算方位旋转需要两个固定的水平点。地面观测值会缺省地旋转，以适应GPS方位角。

在缺省情况下，只有方位旋转被设置用来计算地面观测值。其它参数可以设置为用户定义或计算，但只有在观测值里发生系统误差时才使用它们。例如，如果平差在运行，所有距离(由地面技术测量)都有+3 ppm 残差，那么就可以计算距离尺度参数，因为采集数据时有明显的系统误差。该系统误差也许已经发生，因为EDM 上的ppm设置没有被应用。

注: 方位旋转参数不能用于大地水准面转换。

注: 旋转只应用于平差里的观测值。例如：照准观测值，它们不包括在平差中，不能被旋转。

更多信息，请参见定义转换参数。


    网尺度（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来查看、核对或输入应用于平差中每个线性观测值的网尺度乘数。网尺度用于一套观测值从一个基准到另一个的转换。

计算GPS网尺度观测值需要两个固定的水平点和一个固定的垂直点。

计算地面网尺度观测值需要两个固定的水平点或垂直点。

网尺度可应用于转换组中所有的线性GPS观测值。

注: 网尺度参数不能用于大地水准面转换。

更多信息，请参见定义转换参数。


    距离尺度（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来查看、核对或输入应用到参数组里每个距离观测值的距离尺度乘数。

距离尺度用于基准转换，有时也用于改正观测值里的系统误差。定义这个参数时需要两个固定的水平点。

注: 距离尺度不能用于大地水准面转换。

更多信息，请参见定义转换参数。


    距离常数（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来在项目单元里查看、核对或输入常量距离值到GPS参数组里的每个距离观测值。这个参数会改正观测值的系统距离误差，在定义它时需要两个水平点。

注: 距离常数参数不能用于大地水准面转换。

更多信息，请参见定义转换参数。


    高度常数（转换参数）

更多信息

如何做 ...	对话框	亦请参见
综述

数值和状态域用来查看、输入、计算或定义常量高度值，它会添加到转换组的每个垂直观测值里。高度常数用来改正观测值里的系统误差和转换大地水准面模型。这个参数值需要一个高程和一个高度。

该参数可用来改正垂直观测值里的系统误差并转换大地水准面模型。

更多信息，请参见定义转换参数。


    组观测值（转换组 - GPS）

更多信息

如何做 ...	对话框	亦请参见
综述

这个列表用来查看GPS转换组，并添加或删除GPS转换组观测值。但您不能编辑任何一个域。

以下栏目可以使用：

栏目	显示内容
观测值	分配给观测值的ID。GPS 观测值的编号是以字母"B"起头的。
从点	观测值的起始点。
到点	观测值的结束点。
类型	用于采集测量值的测量方法。

提示：您可以移动这些栏目，调整其大小并给它们排序。


    有效观测值（转换组 - GPS）

更多信息

如何做 ...	对话框	亦请参见
综述

这个列表用来查看所有网平差中激活的观测值，并作为给转换组添加观测值的来源。所有域都只能用作显示，不能编辑。

数据最初载入到项目中时，所有的激活观测值都会加入到<GPS 缺省>组里。虽然观测值可以转移到用户定义的转换组里，但每个观测值都只能存在于一个用户定义组里。

从这个列表可以选择任何观测值，并添加到当前转换组里。包括那些分配到用户定义转换组里的观测值。当属于其它用户定义组的观测值添加到当前组中时，它会从那个组删除。

提示：用一种或一种以上的观测方法采集的观测值可以被筛选。筛选的观测值会被临时隐藏，使列表变小。这样更容易寻找观测值。使用类型域可以知道采集观测值使用的测量方法。更多信息，请参见筛选观测值。

注: 这个列表并不反映项目里的所有观测值，只反映了用在网平差的观测值。

包括以下栏目：

栏目	显示内容
观测值	分配给观测值的ID。GPS观测值的编号都以字母"B"起头。
从点	观测值里的起始点名称。
到点	观测值里的结束点名称。
类型	采集观测值使用的观测方法。四个可能的数值是RTK、动态、静态和连续。
转换组	观测值分配的转换。

提示：您可以移动这些栏目，调整其大小或者给它们排序。


    组观测值（转换组 - 大地水准面）

更多信息

 亦请参见

综述

这个列表用来查看<水准面缺省>转换组。所有的域只能显示，不能编辑。

当大地水准面差距载入到网平差时，所有网平差里使用的大地水准面观测值都自动载入到这个列表里。

大地水准面观测值不能从列表里删除。从列表删除观测值的唯一方法是禁用这个观测值，防止它在项目里使用。

提示：您可以移动这些栏目，调整其大小并给它们排序。

包括以下栏目：

栏目	显示内容
观测值	分配给观测值的ID。大地水准面观测值的编号是以字"G" 起头的。
点	被坐标用来从模型中提取大地水准面观测值的点的名称。
差距	在WGS-84椭球和平均海水面的大地水准面差距。
误差	大地水准面观测值里的估计误差。
注: 最初大地水准面差距的估计误差是这套观测值的标准误差。Trimble Geomatics Office 软件先计算平差里所有大地水准面差距的平均值，然后决定差距的标准误差值。这只是一个起始点，在估计的误差真正完成前，您可能需要缩放观测值。

注: 在网平差形式对话框里，通过增加大地水准面差距的最小标准误差，您可以改变标准误差。


    有效观测值（转换组 - 大地水准面）

更多信息

 亦请参见

综述

有效观测值列表被禁用，而且也不使用。


组观测值（转换组 - 地面）

综述

这个列表用来查看地面转换组，还可以添加或删除地面转换组观测值。但不能编辑列表里的信息。

包括以下各栏目：

栏目	显示内容
观测值	分配给观测值的ID。地面观测值编号都是以字母"T" 起头。水准观测值都是以字母"L"起头。
后视点	观测值后视点名称。
测站点	观测值测站点名称。
前视点	观测值前视点名称。

提示：可以移动这个栏目，调整它的大小或者给它排序。

注: 水准和方位角观测值都被视为地面观测值。对于这些观测值，就把测站点认为 �从� 点、前视点认为 �到� 点。


有效观测值（转换组 - 地面）

综述

这个列表显示那些在网平差里使用的观测值。使用它来查看网平差中的所有有效观测值。您也可以用它作为添加观测值到一个地面转换组的来源。但您不能编辑列表里的信息。

当数据最初载入到项目中时，所有激活的观测值会被添加到<地面缺省> 组里。当创建了用户定义的转换组时，这些观测值就从<地面缺省>组里删除。

您可以选择有效观测值列表里的任何观测值，并且把它们添加到当前的转换组里。这包括那些分配到用户定义转换组里的观测值。 (这样做时，观测值就会从其它组里删除。)

提示: 用不同方法采集的观测值可以被筛选，例如：高程变化量。筛选的观测值会临时隐藏，使列表变小。这样的列表更容易寻找观测值。更多信息，请参见筛选观测值的观测值。

包括以下栏目:

栏目	显示内容
观测值	分配给观测值的ID。地面观测值编号都是以字母"T" 起头。水准观测值都是以字母"L"起头。
后视点	观测值后视点名称。
测站点	观测值测站点名称。
前视点	观测值前视点名称。
转换组	这一栏目告诉您观测值是否被分配到了转换组里。

提示：您可以移动这个栏目，调整它的大小或者给它排序。

注: 水准和方位角观测值都被视为地面观测值。对于这些观测值，就把测站点认为 �从� 点、把前视点认为 �到� 点。


加权策略对话框 � 综述
    加权策略对话框 − 综述

更多信息

如何做 ...	对话框	亦请参见
综述

可以用加权策略对话框定义和应用加权策略到GPS观测值、地面观测值、大地水准面观测值和方差组中。

要访问它：

  选择平差 / 加权策略。

加权策略对话框包括GPS、地面和大地水准面标签。每个标签里包含一个用来查看网平差观测值的观测值列表。选择相应的标签，可以查看所有的GPS观测值、地面观测值或是大地水准面差距为之存在的所有点。

每个标签包含以下选项：

应用标量到

选择这些选项之一来定义把加权策略应用到观测值或方差组时使用的方法。

标量类型

选择这些选项之一，使用应用标量到组里选择的方法来把标量应用到估计误差里。更多信息，请看标量类型。

标量值

只有选择了标量类型组里的用户定义选项，这个域才会激活。在这个域里输入一个数值来定义和应用标量值。

单击锁定时，当前平差的标量会插入到这个域里。

警告：编辑这个域时要十分小心。有关估计加权策略结果的原则，请看加权策略报告统计。

观测值

这个列表用来查看所有GPS观测值和地面观测值的标量，或查看存在大地水准面差距的观测值标量。选择GPS、地面或大地水准面标签时，这个列表会有不同的外观和内容。更多信息，请看下列主题：

  观测值 (GPS)

  观测值 (地面)

  观测值 (大地水准面)

组

这个列表用来显示应用于组内所有观测值的方差组和标量值。选择了GPS标签并把应用到标量设置为方差组时，这个列表就会自动出现。更多信息，请看组。

锁定

单击这个按钮来锁定当前的标量值。

一旦平差使用可选择标量类型通过了x-平方测试(参考因子 ~ 1.00)，就锁定标量值。标量值被锁定后，标量类型就会自动改变为用户定义，同时标量出现在标量值域里。可选择标量类型就不再使用。

注：选择自动标量类型执行自动平差时，标量值会锁定，标量类型改变为用户定义。

使用缺省或用户定义标量类型时，锁定按钮被禁用。

应用

单击这个按钮，把标量加权策略应用到下一个平差叠代中。只有选择了用户定义标量类型后，这个按钮才有效。

筛选器

单击这个按钮，显示带有筛选观测值选项的观测值筛选对话框。筛选功能在查看大量观测值时很有用。退出对话框时，所有筛选器会被自动删除。更多信息，请看筛选观测值。


    GPS(加权策略)

更多信息

如何做 ...	对话框	亦请参见
综述

GPS标签用来为GPS观测值查看、定义和应用加权策略。

要访问它：

1.	选择平差 / 加权策略。加权策略对话框出现。

2.	选择GPS标签。

访问方差组的加权策略还需要另一个步骤。

访问方差组选项：

  把应用标量到选项设置为方差组。

对话框外观改变，同时观测值列表被组列表替换。可以从这个列表里选择方差组，而且加权策略可以被定义和应用到方差组里的观测值。


地面(加权策略)

综述

地面标签用来为地面观测值查看、定义和应用加权策略。也可以访问方差组的加权策略。

方法是：

1.	选择平差 / 加权策略。加权策略对话框出现。

2.	选择地面标签。

3.	如果想访问方差组的加权策略，在应用标量到组里选择方差组选项。

观测值列表变为组列表，从中可以选择适当的方差组。也可以定义加权策略并把它们应用到包含在方差组里的观测值中。


    大地水准面(加权策略)

更多信息

如何做 ...	对话框	亦请参见
大地水准面标签用来为大地水准面观测值查看、定义和应用加权策略。

方法是：

1.	选择平差 / 加权策略。加权策略对话框出现。

2.	选择大地水准面标签。

如果没有观测值出现在列表里，请检查观测值对话框的大地水准面标签。必须分配一个大地水准面模型到项目里，同时大地水准面差距也必须从模型装载到项目里。

注：最初的大地水准面差距的估计误差是从观测值集的平均数得来的标准误差。Trimble Geomatics Office 软件先计算平差里所有大地水准面差距的平均数，然后根据每个差距的平均数来决定标准误差。在大地水准面差距里，这只是误差估计的一个起点，在估计误差真正完成前，您可能需要标定这些观测值。

注：在网平差形式对话框里，可以通过增加大地水准面差距的最小标准误差来改变标准误差。


    应用标量到

更多信息

如何做 ...	对话框	亦请参见
综述

这些按钮用来选择把标量加权策略应用到观测值或方差组时使用的方法。

包括以下选项：

所有观测值

选择这个选项，把单一标量加权策略应用到特定类型(GPS、地面或大地水准面)网平差中的所有激活观测值中。这个过程是基于总体网误差的。它是网平差的缺省选项。

当使用同样的设备、按照同样的原则来执行网内所有测量时，使用这一设置。在用简单网工作时，应用加权策略于所有观测值是一个可行的实践。

标量类型设置为缺省时，1.0缺省标量就会应用于所有的观测值。

标量类型设置为可选择时，最后平差的组参考因子乘以最后平差的标量之积将应用于所有观测值的所有误差估计。

标量类型设置为用户定义时，光标会出现在组列表的标量域里，表示允许输入标量值。执行下一个平差叠代时，输入到这一域的数值就会应用于所有观测值的所有误差估计中。

标量类型被设置为自动时，软件会通过使用可选择标量类型选项来执行自动平差。它会重复平差直到通过x平方测试。

要估计加权策略结果，请看平差报告的加权策略部分。

每个观测值

选择这个选项，把单个的加权策略应用到包括在网平差内每个激活的矢量中。这是基于每个矢量的误差的。

注：只有在GPS标签里这个选项才有效。

这个设置用于诊断目的，例如定位网内的坏观测值。在最终平差时，Trimble建议您不要使用这个方法来应用加权策略。

标量类型设置为缺省时，1.0缺省标量就应用于每个观测值。

标量类型设置为可选择时，最后平差的方差组参考因子乘以最后平差的标量之积将应用于每个观测值的所有误差估计中。

要估计加权策略结果，请看平差报告的加权策略部分。

方差组

这个选项用来把加权策略应用到方差组里的所有观测值上。

注：只有选择加权策略对话框里的GPS或地面标签时，这个选项才有效。

选择这个选项时，观测值列表会被组列表代替，显示所有的方差组和它们的标量值。

标量类型设置为缺省时，1.0缺省标量就会应用于组内的所有观测值。

标量类型设置为可选择时，最后平差的方差组参考因子乘以最后平差的标量之积应用于组内观测值的所有误差估计中。

标量类型设置为用户定义时，光标会出现在组列表的标量域里，表示允许输入标量值。执行下一个平差叠代时，输入这一域的值会应用于组内观测值的所有误差估计中。

标量类型设置为自动时，软件用可选择标量类型选项执行自动平差。它重复平差直到通过x平方测试。

要估计加权策略结果，请看平差报告的加权策略部分。

对于GPS观测值，所有观测值、每个观测值和方差组选项都有效。对于地面观测值，所有观测值和方差组选项有效。对于大地水准面观测值，只有所有观测值选项有效。

以下显示的是可能的加权策略组合：

标量类型	应用标量到	标量列表
缺省	所有观测值	没有使用加权策略
	每个观测值	没有使用加权策略
	方差组	没有使用加权策略
可选择	所有观测值	单一标量被全球应用于每个类型
	每个观测值	不同标量被应用于每个观测值
	方差组	单一标量被应用于每个组
用户定义	所有观测值	单一标量被全球应用
	方差组	单一标量被应用于每个组
自动	所有观测值	单一标量被全球应用
	方差组	单一标量被应用于每个组


    标量类型

更多信息

如何做 ...	对话框	亦请参见
综述

这些选项用来选择应用到GPS观测值、地面观测值、大地水准面观测值和方差组的标量类型。

包括以下选项：

缺省

这个选项使用应用标量到列表里选择的方法来把1.0缺省标量应用于估计的误差。

这个类型用于平差的第一个叠代。它把估计误差应用于表面数值，允许您访问网里的误差。这是对第一个平差叠代的缺省设置。

注：当一个观测值从平差里删除时，您应该重新使用缺省标量类型。

注：GPS观测值使用缺省标量时，“从”点坐标会被保存并用于所有后续平差（直到运行另一个缺省标量平差），从而模拟矢量到椭球上。

要估计加权策略结果，请看平差报告的加权策略部分。

可选择

这个选项用来应用一个由最后平差的标量乘以最后平差的参考因子计算得到的标量。通过使用从应用标量到选项里选择的方法，可以把得到的标量值应用到估计误差中。这会让Trimble Geomatics Office软件自动为下一个平差叠代计算标量。

可选择标量为您执行的每个平差叠代而应用于估计误差中，直到全球统计合格（即通过了x平方测试）。一旦结果合格，就锁定标量值，从而停止应用新的标量到每个连续的平差叠代中。

要估计加权策略结果，请看平差报告的加权策略部分。

注：从平差中删除超限估计误差前，可以尝试可选择地标定它们。标定以后，您就可以知道超限的估计误差是否合格。如果可选择的标定不能解决超限值，就删除超限值，并把加权策略改回缺省标量类型。

警告：如果使用可选择标量，在进行平差叠代时要监视标量的大小。最好不要使用异常大的标量来解决超限值。

用户定义

这个选项用来把用户定义的标量应用到估计误差中，使用的方法从应用标量到选项里选择。

为应用标量到选项选择每个观测值时，这个类型被禁用。

可选择标定完成后使用锁定按钮时，这个类型会自动设置。应用于平差的最后可选择标量会放置到标量值域中，变成用户定义的标量。

人工定义标量的实践，需要充分的最小二乘平差和测量观测值知识。对于Trimble Geomatics Office软件的初级用户，Trimble不推荐这个类型。有关测量观测值和最小二乘平差的更多信息，请看参考资料。

自动

标量类型设置为自动时，软件用可选择标量类型选项执行自动平差。(在任何时间要停止平差，使用ESC键。)

软件会重复这个平差，直到全球统计合格，即：通过了x平方测试。但如果在10次叠代后x平方测试还没有通过，平差就结束并且出现一条警告信息，您将需要检查用在平差里的输入数据。

如果自动平差成功完成，标量值就会锁定，标量类型变成用户定义。再运行一次平差，然后就可以查看网平差报告。网平差报告显示使用的用户定义标量类型。

注：如果自动平差没有成功完成（即：x平方测试失败），网平差报告就会显示出使用的可选择标量类型。

注：数据集里的故障会造成平差里其它观测值的过标定。因此使用自动标量类型前，请确认已删除了所有故障。通过采用缺省标量选项运行平差、然后检查结果的方法，您可以检测到任何故障或错误数据。

使用了自动标量类型选项后，请认真检查平差结果，特别是平差柱状图，以确保没有故障隐藏在观测值里。

警告：Trimble建议不要在GPS或地面观测值里同时使用自动标量类型选项。

有关估计加权策略结果的更多信息，请看平差报告的加权策略部分。

这些加权策略可能用于多种选项：

标量类型	应用标量到	标量列表
缺省	所有观测值	没有使用加权策略
	每个观测值	没有使用加权策略
	方差组	没有使用加权策略
可选择	所有观测值	单一标量被全球应用
	每个观测值	不同标量被应用于每个观测值
	方差组	单一标量被应用于每个组
用户定义	所有观测值	单一标量被全球应用
	方差组	单一标量被应用于每个组
自动	所有观测值	单一标量被全球应用
	方差组	单一标量被应用于每个组

有关估计加权策略结果的原则，请看平差报告的加权策略部分。


    观测值(加权策略)

更多信息

 亦请参见

综述

使用观测值列表来查看用于包含在网平差里的每个观测值的加权策略。这个列表会以不同的形式出现在加权策略对话框里的GPS、地面和大地水准面标签里。

但是，在GPS和地面标签里，当应用标量到设置为方差组时，观测值列表会自动变成组列表。

更多信息，请看下列主题：

  观测值 − GPS 观测值

  观测值 − 地面观测值

  观测值 − 水准面观测值


观测值 (加权策略 - GPS)
    观测值(加权策略 − GPS)

更多信息

如何做 ...	对话框	亦请参见
综述

这个观测值列表用来查看所有包含在网平差里的GPS观测值的标量加权策略。您不能编辑这个列表里的任何信息。

只有在应用标量到被设置为所有观测值或每个观测值时，观测值列表才有效。当应用标量到被设置为方差组时，观测值列表会自动变成组列表。

提示：可以使用筛选器按钮来筛选用不同测量方法采集的观测值。筛选会暂时隐藏一些观测值，这样查看其它观测值就更容易。类型域用来决定采集观测值使用的测量方法。更多信息，请看筛选观测值 。

包括以下各栏目：

栏目	显示内容
观测值	网平差里观测值的记录编号。GPS观测值的记录是以字母“B”起头的。
从点	观测值的起始点。
到点	观测值的结束点。
标量	观测值的单个标量。
类型	GPS观测值类型。
方差组	观测值分配的方差组。单个GPS观测值只能分配给单个方差组，即：多重用户定义组可以存在，但每个观测值只能被分配到一个组里。

提示：可以调整列表里栏目的尺寸，移动它们或为它们排序。


观测值 (加权策略 - 大地水准面)
    观测值(加权策略 − 大地水准面)

更多信息

如何做 ...	对话框	亦请参见
综述

这个观测值列表用来查看装载到项目里的大地水准面观测值。不能编辑组列表里的任何信息。

如果没有为项目选择大地水准面模型或是没有装载大地水准面差距，观测值列表就会是空的。

包括以下各栏目：

栏目	显示内容
观测值	网平差里观测值的记录编号。大地水准面观测值的记录以字母“G”起头。
点	用来生成大地水准面观测值的点名称。
下一个标量	将被应用到观测值的下一个标量值。
差距	来自选择的大地水准面模型的大地水准面差距。
误差	大地水准面观测值里的估计误差。
方差组	显示观测值是否分配到方差组。因为只能存在一个大地水准面方差组，所以所有观测值都分配到<大地水准面缺省>组里。 注：在任何网平差里，<大地水准面缺省>组都是唯一的大地水准面方差组。因为给来自大地水准面模型的每个大地水准面观测值插值所采用的方法都是相同的，所以就没有必要再把它们分散到多重组里。

提示：可以调整列表里列的尺寸，移动它们或为它们排序。


    组(加权策略)

更多信息

如何做 ...	对话框	亦请参见
综述

这个组列表显示应用于组内所有观测值的方差组和标量值。

在加权策略对话框的GPS和地面标签里，当应用标量到被设置为方差组时，组列表才变为有效。在大地水准面标签里，这个列表无效。

包括以下各栏目：

栏目	显示内容
组名称	方差组的名称。您不能编辑这个栏目里的信息。
下一个标量	用于方差组的下一个标量值。在选择用户定义标量类型时，可以输入一个标量值。如果标量类型是缺省或可选择，就不能编辑栏目里的信息。

提示：可以调整列表里栏目的尺寸，移动它们或为它们排序。


观测值(加权策略 � 地面)
观测值(加权策略 − 地面)

综述

只有在应用标量到被设置为所有观测值时，这个列表才有效。可以用它来查看包含在网平差里的所有地面观测值的标量加权策略。但不能编辑它的任何域。

提示：可以使用筛选器按钮来筛选不同的观测值类型。筛选会暂时隐藏一些观测值，这样查看其他观测值就更容易。更多信息，请看筛选观测值 。

包括以下各栏目：

栏目	显示内容
观测值	网平差里观测值的记录编号。地面观测值的记录以字母“T”起头。字母“L”用来指示水准观测值。
后视点	观测值后视点的名称。
测站点	观测值测站点的名称。
前视点	观测值前视点的名称。
下一个标量	应用于观测值的下一个标量值。
方差组	分配观测值的方差组。虽然存在多重的用户定义组，但您只能分配一个地面观测值到一个方差组里。

提示：可以调整列表里栏目的尺寸，移动它们或为它们排序。

注：水准和方位角观测值被认为是地面观测值。对于这些观测值，测站点被看作为“从”点，前视点被看作为“到”点。


    平差标题

更多信息

 亦请参见

综述

用出现在报告顶端的平差标题查看项目信息。

标题包括了从项目属性采集的信息。目录部分包括用来显示报告各部分的超链接，它们在屏幕左侧显示。

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	用目录部分的超链接浏览报告。

下列域或小节有效：

项目

显示项目名称。

用户名

显示输入到项目属性的名称。

日期和时间

显示报告产生的日期和时间。

坐标系统

显示在项目属性中选择的坐标系统。

区域

显示在项目属性中选择的坐标系统区域。如果选择了GPS校正点，站点名称将在区域域显示。

所有发布的坐标系统都将有一个区域。唯一没有区域的坐标系统是缺省投影，它显示区域域中的“缺省”。当假设一个站点坐标（诸如N = 10000、E = 10000和高程 = 100）时，缺省就被使用。

项目基准

该域显示项目属性中的已选项目基准。它不代表为平差选择的基准。

垂直基准

可以把该域添加到网平差报告标题信息内。要显示用于项目的垂直基准，把必要的细节添加到项目属性对话框 - 项目细节标签中的垂直基准域内。

水准面模型

模型分配到项目属性中时，该域显示水准面模型。如果模型没有分配到项目中，该域将显示‘没有选择’。

坐标单位

显示项目属性中的已选坐标系统单位。

距离单位

显示项目属性中的已选距离单位。

高度单位

显示项目属性中的已选高度单位。

目录

目录显示在屏幕左侧，包括下列一些或全部超链接：

  项目细节

  平差形式设置

  残差限差

  协方差显示

  平差控制

  安装错误

  统计总结

  GPS观测值统计

  水准面模型统计

  地面观测值统计

  加权策略

  平差坐标

  格网坐标

  大地坐标

  坐标变化量

  控制坐标比较

  平差观测值

  GPS观测值

  水准面观测值

  地面观测值

  标准残差柱柱状图

  点误差椭圆

  协方差项

选择上述超链接可以获得关于个别报告部分的更多信息。


    已平差坐标

更多信息

 亦请参见

综述

用下列统计结果快速查看：

  点数目

  约束到坐标分量的点数目

  约束和平差点的坐标值

  平差中每个点的后验标准（估计）误差

  最终估计误差

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击平差坐标。

平差坐标各部分以一组域开始，后面跟随单独的表格，如下所示：

  平差格网坐标

  平差大地坐标

  平差坐标变化量

这些表格包括网平差中每个点的数据。

这些统计包括：

执行平差在

这个域可以识别用于执行网平差的基准。WGS-84基准应该用于最小约束平差或GPS观测值的自由平差。如果选择WGS-84基准，该域将显示：

执行平差在 WGS-84 中

完全约束平差通常用项目基准执行。上例中的WGS-84用项目基准名代替。

点数目

这个域列出了包括在网平差内的点的数目。

约束点数目

这个域列出了带有约束坐标分量的点的数目。

约束点数目分散进入对固定分量的描述。例如：

  只有水平

  只有高度

  只有高程

  只有水平和高度

  只有水平和高程

  水平加高度和高程

上面的域直接跟随下面的表：

  平差格网坐标

  平差大地坐标

  平差坐标变化量

关于估算每个表中报告的数据的更多信息，请看上述主题。


    坐标变化量

更多信息

 亦请参见

综述

这个表列出了最近平差中大部分点坐标的坐标转换（平差）量级。

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击平差坐标 ? 变化量。

平差坐标变化量统计结果出现。

这些统计列出了平差的所有点和在最后一次平差期间应用到每个分量的转换量。基于为项目选择的项目坐标单位，变化量用线性单位表示。

执行了完全约束平差，特别是估计了转换量级中的不规则性后，坐标的变化量信息将非常有用。

栏目包括：

栏目	显示平差（转换）为�
点名称	−
Δ北向	北向坐标分量
Δ东向	东向坐标分量
Δ高程	坐标的高程
Δ高度	坐标的椭球高度
Δ水准面差距	定义了水准面模型、并且把差距装载到项目中时的水准面差距。水准面差距不可用时，该域是空的。


    协方差项

更多信息

 亦请参见

综述

这些统计用来表示平差点间的相关线精度(协方差项)。

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击协方差项。

协方差项统计结果出现。

显示的协方差项数目根据定义在平差形式中的一般属性而变化。

  所有线 − 从使用缩小的圆柱剖面图和限制观测线协方差项约束选项删除检查标记，将会显示与网中所有点间误差相关的全部可能的方位角、椭球高度变化量、距离和高程变化量。

  观测线 − 选择使用缩小的圆柱剖面图和限制观测线协方差项约束选项，将会显示只与已观测线相关的所有方位角、椭球高度变化量、距离和高程变化量。

有关改变这些统计内容的更多信息，请参见协方差显示。

用这些精确的统计来了解网中任何点对的相对误差。

下面表格可以使用：

栏目	显示内容
从点	相对协方差项起始点。
到点	相对协方差项终止点。
分量	点间相对线段分量。
后验误差 (   )	观测值分量的后验误差。平差形式中选择的置信等级显示在括号内，它用来计算后验估算值。
水平精度 (    )	协方差值的二维或水平精度。表示精度的方法 (PPM 或比率) 显示在括号内。
3D 精度 (    )	协方差值的三维精度。表示精度的方法 (PPM 或比率) 显示在括号内。


标准化残差柱状图
    标准残差柱状图

更多信息

 亦请参见

综述

这些柱状图用来查看下列信息：

  标准化残差的频率分布

  观测值超限

  正态分布曲线

  临界Tau值

要访问这些柱状图：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击标准残差柱状图。

标准残差柱状图出现。

这些柱状图包括：

  组合 − 为水平和垂直观测值的标准化残差组合绘图

  水平 − 为水平观测值的标准化残差绘图

  垂直 ?  为垂直观测值的标准化残差绘图

柱状图以图形方式显示了最近平差的观测值标准化残差的频率分布。平差观测值统计列出了每个观测值的标准化残差。

中心垂线是零残差。根据正态分布，最小的残差环聚在中心垂线周围，显示了残差分布的最高频率。较大的残差从零线向较远的位置随着频率的减小而递减。

如果平差残差随机分布，则频率分布绘图就接近于正态分布曲线。该曲线叠加在残差图的上面。

零线的左右垂直线显示了临界Tau。位于这些垂直线外侧的标准化残差都被看成是超限值。条型比例代表sigma值。这个 sigma 与平差观测值统计中的 Tau 值匹配。


个别 GPS 观测值统计
    个别GPS观测统计

更多信息

 亦请参见

综述

这些统计显示了包括（使用）在平差中每个观测值的观测值 ID、参考因子和冗余数(自由度)。

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	从目录中单击GPS观测值统计。

统计结果样本如下所示：

观测值 ID	参考因子	冗余数
B1	1.56	2.03
B2	0.96	1.88
B3	1.21	1.66
B4	2.06	1.93

包括下列域：

观测值 ID

用这个域来了解分配给观测值的项目记录数。记录数包括B再加后面一个或一个以上的数字。

参考因子

用这个域来了解每个个别观测值的参考因子对GPS观测值统计的参考因子有多大贡献。

注：计算所有GPS观测值的参考因子时，所有个别观测值的参考因子都被考虑。GPS观测值参考因子的数值与大地水准面观测值的参考因子一道被用来计算网的参考因子。

冗余数

用这个域来了解每个GPS观测值对GPS观测值统计所贡献的冗余有多少。这个域让您知道是否个别的GPS观测值缺乏冗余。GPS观测值统计的冗余数与大地水准面观测值的的冗余数一道被用来计算网的自由度。

要考虑下列原则：

  估计了全球统计部分的网参考因子和自由度后，再估计这些个别的观测值统计。所有的个别参考因子都应该位于1.0的中央。

  估计列表时，要寻找连贯性。要注意任何大于1.0或小于1.0的极端值。为了在个别的参考因子统计中实现更多的连贯性，要从平差中删除超限值。

  个别的冗余数要给出一个估计，估计每个观测值贡献给网的全球自由度的冗余。

  所有数字都应该大于0.00并小于或等于3.00。

  冗余数越接近于 3.00，观测值贡献给网的冗余量越大。

  冗余数 0.00 建议观测值只连接到另一个观测值的一端。用测量术语表示，这个条件叫作照准。如果不是有意的照准，则应检查观测值不贡献给网的全部冗余的原因。

注：与照准关联的观测值状态可以设置为激活作为检查。


    叠代次数

更多信息

 亦请参见

综述

用这个域中显示的信息来了解使平差成功收敛所执行的叠代数。

要访问这个信息：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击统计总结。

叠代次数域出现。

所有可能的信息都显示在下面：

第 #  次叠代平差成功

第 #  次叠代平差成功（使用了最终收敛截止）

(# = 叠代次数)

报告的叠代数决不能超过在编辑平差形式对话框里选择的最大叠代数。

注：如果平差不能收敛，报告就不产生。


    已平差观测值

更多信息

 亦请参见

综述

用这些统计来了解有关已平差GPS和大地水准面观测值的信息：

  用在平差中的基准

  用在平差中的临界Tau值

  带有相关后验标准（估计）误差的观测值分量、残差和标准化残差

  标记为超限的观测值分量

  带有相关误差估计(完全约束平差)的转换参数

  在平差中使用的观测值总结，以及所有观测值（GPS、地面和大地水准面）的列表。

GPS、地面和大地水准面观测值的观测值表格可用来：

  核对在平差中使用的观测值数目。

  估计每个观测值分量的后验标准误差。

  识别那些超过了为网定义（超限值）的临界Tau的观测值分量。可疑的观测值（超限值）用红色突出显示。

  识别任何意外转换和参数中的大误差评估。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击平差观测值。

平差观测值统计出现。

这一部分划分为以下几个部分：

  GPS

  地面

  大地水准面

注：可以从网平差报告的测量视图中选择观测值。方法是：从网平差报告选择观测值ID。（如果选择多重观测值，使用Ctrl键）。在报告中选择观测值时，测量视图里的当前选择项被清除，它用从报告中选择的观测值代替。


    点误差椭圆

更多信息

 亦请参见

综述

这些统计用来查看点误差（水平和垂直）的大小和方向的图解表示。点误差椭圆用图形方式显示了平差点的水平坐标后验标准误差以及点间的协方差项。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击点误差椭圆。

点误差椭圆统计出现。

考虑以下原则：

  椭圆顶端向北。

  指向椭圆右侧的箭头表示高度和高程的后验标准误差。

  贯穿椭圆和箭头的条型比例尺表示误差的幅度。

  条型比例尺的刻度值沿着误差椭圆显示在项目单元中。使用图形窗口中的椭圆工具条，可以编辑条型比例尺的刻度值，以便平差比例尺的清晰度。椭圆工具条不影响网平差报告的误差椭圆比例。

  半长轴（表示最大误差方向的轴）的起点在椭圆右下部。这个角度从东比例尺的正向反时针测量。

  水平和垂直坐标的标准误差分别乘以二元变量和一元变量sigma 标量。


    统计总结

更多信息

 亦请参见

综述

用报告的这一部分可以快速访问统计结果。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击统计总结。

统计总结出现。

统计总结是分析平差结果的重要工具。以下是可以访问的总结报告的关键部分：

  叠代次数

  全球统计

  观测类型统计

  方差组统计

  加权策略

  个别GPS观测值统计

典型地，您将直接进入到统计总结（特别是进入到全球统计）来分析执行最小约束平差时的全面统计结果。x方测试、网参考因子和自由度值是表示网拟合程度的关键指标。


    方差组统计

更多信息

 亦请参见

综述

用方差组统计总结来了解为每个方差组决定的参考因子和冗余数(自由度)。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	从目录单击统计总结。

每个观测值类型的方差组统计都能被查看。

每个方差组将报告下列域：

组名称

这个域显示方差组名称。

参考因子

这个域显示每个方差组对网参考因子的贡献大小。每个方差组都有其自身的估计误差，因而有其自身的参考因子。

冗余数

这个域显示每个方差组贡献给网自由度的冗余量大小。通过该域可以了解方差组是否缺少冗余度。


    加权策略

更多信息

 亦请参见

综述

用这些统计来了解缩放方法是否正确，标量类型和标量值用来设置GPS观测值、大地水准面观测值或方差组。

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	从目录单击加权策略。

加权策略统计出现。

一些以每套GPS观测值、地面观测值、大地水准面观测值和方差组为内容的单独总结产生出来，这些总结由主题、描述性字字符串和标量域构成。下面给出了GPS观测值的总结样本：

GPS观测值
应用到所有观测值的缺省标量集
标量: 1.00

上例表明缺省标量类型应用到了使用缺省标量值1.0的所有GPS观测值上。出现在加权策略报告部分的域描述如下所示。要注意这些总结的一些组合可能出现在报告中，这取决于应用到观测值集的观测值组数和加权策略类型。

主题、字符串和标量域的关系是：

主题	·	GPS观测值
字符串	·	应用到所有观测值的缺省标量集
标量域	·	标量：1.00

主题

上例中，GPS观测值是应用到所有GPS观测值的一套加权策略主题。用在平差中的每个观测值组类型主题将在加权策略部分出现。

应用标量到 / 标量类型

对于每个观测值的集，总结项的第一个域是字符串，代表把标量应用到一组观测值所使用的方法以及使用的标量类型。字符串后面紧跟一个描述一套观测值的主题。在上例中，主题是‘GPS观测值’， 字符串是‘缺省标量应用到所有观测值’。

‘标量应用到’四个字总出现在字符串中。这些字由标量类型设置前导，后面是应用标量到设置。这些设置在加权策略对话框中定义。各种观测值集合的可能的字符串组合列举如下：

  缺省标量应用到所有观测值

  可选择标量应用到所有观测值

  用户定义标量应用到所有观测值

  缺省标量应用到每个观测值

  可选择标量应用到每个观测值

  缺省标量应用到方差组

  可选择标量应用到方差组

  用户定义标量应用到方差组

注：自动标量类型选项运行可选择标量的多重叠代。如果选择了自动标量类型，并且平差已成功完成，用户定义的标量就显示在上面列出的字符串中。如果自动平差不成功（x方测试失败），则可选择标量就显示在上面列出的字符串中。

验证字符串中正确的加权策略并使用下面所列的标量域，来确定是否把正确的标量应用到了每个观测值或方差组的集里。

标量域

标量域用来识别应用到每套观测值的标量值。根据平差中有多少观测值组，这些域中的几个域就会出现在报告中。共同地，每个字符串和标量值代表应用到各自观测值集的加权策略。

估计这些域可以了解应用到相应一套观测值的标量值是否合理。因为加权策略的一些组合可能会定义到几套观测值中，所以该报告部分可能包括了几对字符串和标量值。您需要把每一套域估计为组。


    格网坐标

更多信息

 亦请参见

综述

这些统计显示了最后平差中每个点的已平差格网坐标。坐标包括后验标准误差（乘以一元变量sigma标量）。在平差形式中选择的一元变量误差显示在坐标列表的顶部。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击平差坐标 ? 格网。

格网坐标统计显示出来。

包括以下栏目：

栏目	显示内容
点名称	在剩余栏目中描述的点名称。
北向	在坐标系统单位中，点的平差北向分量。
纵轴误差	项目单位中为已平差北向分量计算的误差。
东向	在坐标系统单位中，点的平差东向分量。
横轴误差	在坐标系统单位中，为平差东向分量计算的误差。
高程	在项目单位中，点的平差高程坐标分量。
高程误差	在项目单位中，为平差高程坐标分量计算的误差。
固定	平差中的约束点和约束坐标分量。约束坐标分量包括只有水平(2D)、只有垂直(高度或高程)、或水平和垂直。
为了识别各构成部分，下面代码出现在固定栏目中：

代码	含义
N E	水平 2D
h	高度
e	高程
注： 所有约束点都可以没有与坐标分量相关的后验标准误差。这些误差显示为0.000。如果分量或相关的后验误差没有有效值，栏目中将显示N/A。


    大地坐标

更多信息

 亦请参见

综述

这个统计表用来查看最后平差中每个点的已平差大地坐标。坐标包括后验标准误差乘以与每个坐标分量相关的一元变量 sigma标量。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击平差坐标 ? 大地。

大地坐标统计显示出来。

包括以下栏目：

栏目	显示内容
点名称	在剩余栏目中描述点的名称。
纬度	在平差基准中，点的已平差纬度坐标分量。
纵轴误差	在项目单位中，为纬度坐标分量计算的误差。
经度	在平差基准中，点的已平差经度坐标分量。
横轴误差	在项目单位中，为经度坐标分量计算的误差。
高度	在项目单位中，点在椭球坐标分量上方的已平差高度。
高度误差	在项目单位中，为椭球坐标分量上方的高度计算的误差。
固定	平差中的约束点和约束坐标分量。约束坐标分量包括只有水平(2D)、只有垂直(椭球高度或高程)、或水平和垂直。
为了识别各构成部分，下面代码出现在固定栏目中：

代码	含义
Lat Long	水平 2D
h	高度
e	高程
注： 所有约束点都可以没有与坐标分量相关的后验标准误差。这些误差显示为0.000。如果分量或相关的后验误差没有有效值，栏目中将显示N/A。


    全球统计

更多信息

 亦请参见

综述

这些统计显示网的拟合程度。

要访问统计结果：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击统计总结。

全球统计出现。

下面显示的是样本报告部分：

网参考因子	   ：	6.42
x方测试 (a=95%)    ：	FAIL
自由度	   ：	36.00

包括下列域：

网参考因子

这个值让您知道平差的先验(预平差)误差与后验(后平差)误差的匹配程度。

对于了解观测值中的随机误差是否可以接受、以及这些观测值的随机误差是否与估计的标准误差匹配而言，网参考因子是有用的。网参考因子应该约等于1.0。

x方测试

这个值让您了解平差网的拟合程度。如果参考因子接近于 1.0、自由度可以接受，那么网就在数学上拟合、x方测试通过。

当执行成功的最小二乘平差时，网的数学闭合差是一个重要的因素。考虑x方测试是您的数学闭合差的第一个指标。

自由度

这个值让您了解网的全球冗余量。自由度用来识别用于超量解算的、包括在平差中的独立观测值。数值越大，平差中具有的冗余越多。

GPS观测值的冗余数、地面观测值和大地水准面观测值用来共同确定网的全球自由度值。


观测值类型统计
    观测类型统计

更多信息

 亦请参见

综述

用这些统计来了解为每个观测值类型确定的参考因子(RF)和冗余数(自由度)，即：GPS、地面和大地水准面。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上单击统计总结。

GPS观测值统计、地面观测值统计、或大地水准面观测值统计部分出现。

装载了大地水准面观测值后，大地水准面模型统计便有效。

更多信息、请看下列主题：

  GPS观测值统计

  地面观测值统计

  水准面模型统计


    GPS观测值统计

更多信息

 亦请参见

综述

查看在观测类型统计的GPS观测值统计总结中、为GPS观测值确定的参考因子和冗余数(自由度)。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上，单击统计总结? GPS 观测值。

GPS观测值类型统计出现，在该部分开头显示有GPS观测值。

报告的域包括：

参考因子

每个观测值类型都有自己的估计误差，因而都有自己的参考因子。这个值显示出每个观测值类型对网参考因子的贡献程度。Trimble Geomatics Office 软件允许分别采用每个观测值方法（GPS、地面或大地水准面）来独立地为每个观测值组加权，然后把适当的比例应用到每个组的误差估计上。

冗余数

冗余数，有时叫自由度，是每个观测值对总体冗余贡献程度的指标。使用这个统计可以鉴别哪个观测值缺乏冗余。

GPS 方差组统计

每个方差组的报告包括下列域：

  组名称

  参考因子 − 这个域显示每个方差组对网参考因子的贡献程度。每个方差组都有自己的估计误差，因而有自己的参考因子。

  冗余数  − 这个域显示每个方差组对网的自由度贡献的冗余程度。用这个域可以检查方差组是否缺乏冗余。

个别GPS观测值统计

每个GPS观测值的报告包括下列域：

  观测值 ID

  参考因子 − 这个域显示每个GPS观测值对网参考因子的贡献程度。每个GPS观测值都有自己的估计误差，因而有自己的参考因子。

  冗余数 − 这个域显示每个GPS观测值对网的自由度贡献的冗余程度。大数字表示较多的冗余。用这个域可以检查GPS观测值是否缺乏冗余。


地面观测值统计

综述

如果要检查为地面观测值确定的参考因子和冗余数(自由度)，使用观测类型统计的地面观测值统计总结。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上，单击统计总结 ? 地面观测值。

地面观测值统计部分出现。

报告的域包括：

参考因子

每个观测值类型都有自己的估计误差，因而都有自己的参考因子。这个值显示出每个观测值类型对网参考因子的贡献程度。Trimble Geomatics Office 软件允许您分别采用每个观测值方法（GPS、地面或大地水准面）来独立地为每个观测值组加权，然后把适当的比例应用到每个组的误差估计上。

冗余数

冗余数，有时叫自由度，是每个观测值对总体冗余贡献程度的指标。使用这个统计可以检查哪个观测值缺乏冗余。

按类型的地面统计

如果下列观测值类型在平差中出现，它们的参考因子和冗余数就显示出来：

  水平角度

  三角高程

  椭球距离

  高程变化量

  方位角

地面协方差组统计

每个协方差组的报告包括下列域：

  组名称

  参考因子 − 这个域显示每个协方差组对网参考因子的贡献程度。每个协方差组都有自己的估计误差，因而有自己的参考因子。

  冗余数 − 这个域显示每个协方差组对网的自由度贡献的冗余程度。用这个域可以检查协方差组是否缺乏冗余。


    大地水准面模型统计

更多信息

 亦请参见

综述

观测类型统计的大地水准面观测值统计总结用来了解为水准面观测值确定的参考因子和冗余数(自由度)。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2.	在屏幕左侧显示的目录上，单击统计总结 ? 水准面模型。

大地水准面模型统计出现。

报告的域包括：

参考因子

每个观测值类型都有自己的估计误差，因而都有自己的参考因子(RF)。这个值显示出每个观测值类型对网参考因子的贡献程度。Trimble Geomatics Office 软件允许您分别采用每个观测值方法（GPS、地面或大地水准面）来独立地为每个观测值组加权，然后把适当的比例应用到每个组的误差估计上。

冗余数

冗余数，对于整个网也叫作自由度，是每个观测值对总体冗余贡献程度的指标。使用这个统计可以检查哪个观测值缺乏冗余。


    平差GPS观测值

更多信息

 亦请参见

综述

平差GPS观测值表中的观测值用来：

  核对在平差中使用的GPS观测值数目。

  估计每个观测值分量的后验标准误差。

  识别那些超过了为网定义的临界Tau值（超限值）的GPS观测值分量。为了帮助识别超限值，可疑的观测值用红色突出显示。

  识别任何意外转换和参数中的大误差评估。

这些域可能出现在平差GPS观测值表格之前：

注：转换参数域基于参数状态被报告出来。参数将产生下列报告值：

未使用 ? 设置到未使用状态的参数将导致没有报告值。

用户定义 − 设置到用户定义状态的参数将以用户设置的值出现，无论约束坐标分量有多少。

计算 − 设置到计算状态的参数将出现在约束所需的坐标分量数之后。

关于定义和计算转换参数的更多信息，请看转换参数 - 综述。

要访问统计结果：

  选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

在屏幕左侧显示的目录上单击平差观测值 ? GPS。

平差GPS观测值统计显示出来。

包括下列统计结果：

GPS转换组

这个域显示包括在平差中每个转换组的名称。该域也作为区分一个转换组与另一个转换组的报告信息标题。

经度偏差

这些域显示经度偏差参数的值和估计误差。当最少三个高度和一个2D点被固定时，这个值就被计算并报告出来。

注：这会从大地水准面转换组改变。这里所指的大地水准面转换组是固定六个高度(3个正高和3个椭球)和一个2D点的最低要求。

纬度偏差

这些域显示纬度偏差参数的值和估计误差。当最少三个高度和一个2D点被固定时，这个值就被计算并报告出来。

注：这会从大地水准面转换组改变。这里所指的大地水准面转换组是固定六个高度(3个正高和3个椭球)和一个2D点的最低要求。

方位角旋转

这些域显示方位角旋转参数的值和估计误差。当最少二个2D点被固定时，这个值就被计算并报告出来。

网比例

这些域显示网比例参数的值和估计误差。当最少一个高度和二个2D点被固定时，这个值就被计算并报告出来。

距离比例

这些域显示距离比例参数的值和估计误差。这个值用来排除距离中的系统误差。

距离常数

这些域显示距离常数参数的值和估计误差。这个值用来排除距离中的系统误差。

高度常数

这些域显示高度常数参数的值和估计误差。这个参数用来排除系统高度误差。

观测值数目

这个域显示包括在平差内的GPS观测值总数。

超限的数目

这个域显示在平差内发现的超限总数(带有高残差的GPS观测值)。

观测值平差 (临界 � = #)

这个域显示用于平差内的临界Tau值。该域后面紧跟着平差GPS观测值表。

下列栏目包括在平差GPS观测值表内：

栏目	显示内容
观测值 ID	分配给项目中观测值的记录名称。对于GPS观测值，ID编号以字符“B”开头。
从点	开始点名称。
到点	结束点名称。
观测值	GPS观测值分量的已平差值。
后验误差 (Sigma 值)	GPS观测值分量的后验估计误差。设置在平差形式中的sigma标量显示在栏目标题中。
残差	GPS观测值分量的观测值残差。
标准残差	GPS观测值分量的标准化残差。标准化残差允许您直接用角度测量误差与线性测量误差进行比较。


平差地面观测值

更多信息

 亦请参见

综述

用平差地面观测值表里的观测值进行如下操作：

  核对在平差中使用的地面观测值数目。

  估计每个观测值分量的后验标准误差。

  识别那些超过了为网的超限值定义的临界Tau值的地面观测值分量。为了帮助识别超限值，可疑的观测值用红色突出显示。

  识别任何意外转换和参数中的大误差评估。

这些域可能出现在平差地面观测值表格之前：

注：转换参数域基于参数状态被报告出来。参数将产生下列报告值：

  未使用 ? 给出没有报告的值。

  用户定义 − 以用户设置的值出现，无论约束坐标分量有多少。

  计算 − 将出现在约束所需的坐标分量数之后。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2．	在屏幕左侧显示的目录上单击平差观测值 ? 地面。

平差观测值统计显示出来。

包括下列统计：

地面转换组

这个域显示包括在平差中每个转换组的名称。该域也作为区分一个转换组与另一个转换组的报告信息标题。

经度偏差

这些域显示经度偏差参数的值和估计误差。当最少三个高度和一个2D点被固定时，这个值就被计算并报告出来。

注：这可以从大地水准面转换组改变。这里所指的大地水准面转换组是固定六个高度(3个正高和3个椭球)和一个2D点的最低要求。

纬度偏差

这些域显示纬度偏差参数的值和估计误差。当最少三个高度和一个2D点被固定时，这个值就被计算并报告出来。

注：这可以从大地水准面转换组改变。这里所指的大地水准面转换组是固定六个高度(3个正高和3个椭球)和一个2D点的最低要求。

方位角旋转

这些域显示方位角旋转参数的值和估计误差。当最少二个2D点被固定时，这个值就被计算并报告出来。

网比例

这些域显示网比例参数的值和估计误差。当最少一个高度和二个2D点被固定时，这个值就被计算并报告出来。

距离比例

这些域显示距离比例参数的值和估计误差。这个值用来排除距离中的系统误差。

距离常数

这些域显示距离常数参数的值和估计误差。这个值用来排除距离中的系统误差。

高度常数

这些域显示高度常数参数的值和估计误差。这个参数用来排除系统高度误差。

观测值数目

这个域显示包括在平差内的地面观测值总数。

超限数目

这个域显示在平差内发现的超限总数(带有高残差的地面观测值)。

观测值平差 (临界Tau = #)

这个域显示用于平差内的临界Tau值。该域后面紧跟着平差GPS观测值表。

下列栏目包括在平差地面观测值表内：

栏目	显示内容
观测值 ID	分配给项目中观测值的记录名称。对于地面观测值，ID编号以字符“T”开头。
后视点	后视点名称。
观测点	观测点名称。
前视点	前视点名称。
观测值	地面观测值分量的已平差值。
后验误差 (Sigma 值)	地面观测值分量的后验估计误差。设置在平差形式中的sigma标量显示在栏目标题中。
残差	地面观测值分量的观测值残差。
标准残差	地面观测值分量的标准化残差。标准化残差允许直接用角度测量误差与线性测量误差进行比较。


    平差大地水准面观测值

更多信息

 亦请参见

综述

这些统计用来检验关于平差水准面观测值的信息：

  在平差中使用的临界Tau值

  带有相关后验标准（估计）误差、残差和标准化残差的大地水准面观测值

  用红色标记为超限的大地水准面观测值

  带有相关误差估计(完全约束平差)的转换参数

  用于平差中的大地水准面观测值总结和包含有关所有大地水准面观测值信息的表格

平差水准面观测值表格中的观测值用来：

  核对在平差中使用的大地水准面观测值数目。

  估计每个观测值的后验标准误差。

  识别那些超过了为网定义的临界Tau值（超限值）的大地水准面观测值。为了帮助识别超限值，可疑的观测值用红色突出显示。

  识别任何意外转换和参数中的大误差评估。

这些域可能出现在平差水准面观测值表格之前：

注：转换参数域基于参数状态被报告出来。参数将产生下列报告值：

未使用 ??设置到未使用状态的参数将导致没有报告的值。

用户定义 − 设置到用户定义状态的参数将以用户设置的值出现，无论约束坐标分量有多少。

计算 − 设置到计算状态的参数将出现在约束所需的坐标分量数之后。

看转换参数 − 对定义和计算转换参数更多信息的综述(超链接)。

要访问统计结果：

1.	选择报告 / 网平差报告。 缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2．	在屏幕左侧显示的目录上，单击平差观测值 ? 水准面。

平差水准面观测值统计显示出来。

包括下列统计：

大地水准面转换组

这个域显示包括在平差中的大地水准面转换组名称。由于只存在缺省转换组，报告的这个部分将总是列出<水准面缺省>转换组。

经度偏差

这些域列出经度偏差参数的值和估计误差。对于大地水准面转换组，当最少六个高度(3个正高和3个椭球)和一个2D点被固定时，这个值就被计算并报告出来。这可以从GPS转换组改变，这里所指的GPS转换组是固定三个高度和一个2D点的最低要求。

纬度偏差

这些域列出纬度偏差参数的值和估计误差。对于大地水准面转换组，当最少六个高度(3个正高和3个椭球)和一个2D点被固定时，这个值就被计算并报告出来。这可以从GPS转换组改变，这里所指的GPS转换组是固定三个高度和一个2D点的最低要求。

高度常数

这些域列出高度常数参数的值和估计误差。当最少一个高程和一个高度被固定时，这个值就被计算并报告出来。

注：转换水准面高度时，不使用方位角旋转、网比例、距离比例和距离常数参数。

观测值数目

这个域显示包括在平差内的水准面观测值总数。

超限数目

这个域显示在平差内发现的超限总数目(带有高残差的GPS观测值)。

观测值平差(临界 τ = #)

这个域显示用于平差内的临界Tau值。该域后面紧跟着平差水准面观测值表。

下列栏目包括在平差水准面观测值表内：

栏目	显示内容
观测值 ID	分配给项目中水准面观测值的记录名称。对于水准面观测值，ID编号以字符“G”开头。
点名称	用来从水准面模型提取水准面观测值的点的名称。
差距	已平差值。
后验误差（Sigma 值）	后验估计误差。设置在平差形式中的sigma标量显示在栏目标题中。
残差	观测值残差。
标准残差	标准化残差。标准化残差允许直接用角度测量误差与线性测量误差进行比较。
注：如果计算出水准面的相互关联，则所有已平差差距都将有残差。如果没有计算出水准面的相互关联，则只有带垂直约束的点将有水准面残差。


平差形式设置

综述

报告的这一部分用来查看为网平差进行的设置总结。

要访问平差形式设置：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2．	在屏幕左侧显示的目录上，单击平差形式设置。

下列平差形式设置出现：

残差限差

残差限差设置表示为下列数值：

  结束叠代

  最终收敛截止

协方差显示

显示下列水平误差参数信息：

  传播线性误差[E]

  常数项[C]

  线性误差比例[S]

显示与三维参数有关的下列信息：

  传播线性误差[E]

  常数项[C]

  线性误差比例[S]

这部分也告诉您：如果选项为有效，您是否选择了使用高程误差。

平差控制

显示下列信息：

  计算大地水准面的相互关联

  是否已执行水平或垂直平差（或二者）。

注：这部分只显示是否平差包括地面观测值。

安装错误

显示下列GPS安装错误：

  天线高度错误

  对中错误

显示下列地面安装错误：

  仪器高度错误

  对中错误

注：只有地面观测值包括在平差中时，地面安装错误才列出。

关于安装错误设置的更多信息，请看安装错误。


网平差报告设置对话框

综述

这个对话框用来选择显示在网平差报告中的信息。

方法是：

  选择报告 / 设置 / 网平差报告。网平差报告设置对话框出现。

能够在网平差报告显示的条目有：

  个别的GPS观测统计

  已平差的格网坐标

  已平差的大地坐标

  坐标变化量

  控制坐标比较

  点误差椭圆

  协方差项

注：对于大的项目，产生点误差椭圆和协方差项显示需要较长时间。在网平差报告设置对话框中禁用这些选项可以加快报告的产生速度。


控制坐标比较

综述

如果在非约束控制质量坐标的点上执行平差，则网平差报告将显示在非约束控制质量坐标与已平差控制点坐标之间的差值。

要查看控制坐标的比较：

1.	选择报告 / 网平差报告。缺省的HTML查看器开始运行，顶端带有平差标题的网平差报告出现。

2．	在屏幕左侧显示的目录上，单击控制坐标比较。

控制坐标比较显示在带有下列域表格中：

点名称

带有控制质量的点的名称。

数值变化量

在非约束控制坐标与已平差控制坐标间的差值显示为下列内容：

  北坐标变化量

  东坐标变化量

  高程变化量

  高度变化量

注：其差值为：

控制坐标差 = 控制坐标 − 已平差坐标


    平差命令

更多信息

如何做 ...	亦请参见
综述

选择这个命令来执行网平差。

使用该命令前，请确认所有平差形式设置都正确、控制点坐标已设置、而且观测值有效。

要执行平差，选择下列方法之一：

  选择平差 / 调整。

  按F10。

平差开始。

每个平差叠代后，观测值残差会被两种不同的软件程序来计算。这两种计算的差值与结束叠代限差作比较。基于这个比较，下列一项动作会发生：

  如果计算观测值残差间的差值小于结束叠代限差，平差叠代就会停止。网平差报告会包含“# 次叠代平差成功”的信息，## 是需要收敛到网的叠代次数。

  如果计算观测值残差间的差值大于结束叠代限差，平差叠代就会继续。如果平差继续，直到达到最大叠代次数，最终收敛角截止就会被使用（请看下面）。

为网平差的最终叠代输入收敛截止限差。在最终叠代没有通过结束叠代限差时，软件会使用这个数值来决定网平差是否成功。

如果计算的最后平差叠代观测值残差里的差值大于结束叠代限差，那么残差就与最终收敛角截止作比较，而且下列一项动作会发生：

  如果计算的观测值残差间的差值小于最终收敛角截止，则平差成功。这时会显示“##次叠代后最终收敛成功（使用最终收敛角截止）”的信息，##是需要收敛到网的叠代次数。

  如果观测值残差大于最终收敛角截止，则平差失败。这时会出现“平差失败。没有收敛。”的警告对话框。

有关网平差处理的更多信息，请看网平差。

有关叠代和处理时执行计算的更多信息，请看残差限差。


    平差形式命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来查看、创建、复制、编辑、重命名和删除平差形式。

要查看网平差形式对话框：

  选择平差 / 平差形式。


    基准命令

更多信息

如何做 ...	亦请参见
综述

这个命令用来选择用在平差里的基准。

要查看基准子菜单：

  选择平差 / 基准。

带有以下命令的基准子菜单出现：

  WGS-84

  项目基准


    观测值组命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来定义使用在平差里的方差和转换组。

要查看观测值组子菜单：

  选择平差 / 观测值组。

带有以下命令的组子菜单出现：

  方差组

  转换组


    网平差报告命令

更多信息

如何做 ...	报告	亦请参见
综述

这个命令用来查看网平差报告。

要查看网平差报告：

  选择报告 / 网平差报告。报告是HTML格式生成，计算机缺省的HTML浏览器会自动启动，以显示报告数据。

有关报告的更多信息，请看网平差报告。


    观测值命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来查看和估计观测值。它也可以让您从网平差里加入或除去观测值。

要查看观测值对话框：

  选择平差 / 观测值。


    点命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来打开点对话框，该对话框包括查看、设置和清除用在网平差里控制点坐标分量的固定状态选项。

要查看点对话框：

  选择平差 / 点。


    项目基准命令

更多信息

如何做 ...	亦请参见
综述

这个命令用来选择项目基准作为平差基准。项目基准设置在项目属性对话框的坐标系统标签里。在执行完全约束平差或在地面数据上执行最小约束平差时，项目基准会被使用。

要选择项目基准：

  选择平差 / 基准 / 项目基准 − <基准>。一个检查标记会出现在项目基准 − <基准>旁边。


    删除平差命令

更多信息

如何做 ...	亦请参见
综述

这个命令用来删除当前的平差。

要删除已平差数值：

  选择平差 / 删除平差。

这个选项用来把网恢复到平差前的配置。例如，使用这个命令时：

  基准设置为WGS-84

  没有点具有固定状态

  误差椭圆被删除

  水准面观测值被卸载

  纯量重设到所有观测值和缺省选项

注：为平差禁用的观测值和那些在网平差的使用检查框内清除了的观测值不会重设到以前的状态。


    转换组命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来定义使用在平差里的观测值转换组。

要查看转换组对话框：

  选择平差 / 观测值组/ 转换组。


    方差组命令

更多信息

如何做 ...	对话框	亦请参见
这个命令用来定义用在平差里的观测值方差组。

要查看方差组对话框：

  选择平差 / 观测值组 / 方差组。


    WGS-84命令

更多信息

如何做 ...	亦请参见
综述

这个命令用来把WGS-84用作平差里的基准。当在GPS观测值上执行最小约束平差时，应该使用WGS-84基准。

要选择WGS-84基准：

  选择平差 / 基准 / WGS-84。一个检查标记会出现在WGS-84旁边。


    加权策略命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来显示加权策略对话框，它带有定义和应用使用在平差里的纯量加权策略。

要查看加权策略对话框：

  选择平差 / 加权策略。


    保存命令（校正坐标）

更多信息

如何做 ...	对话框	亦请参见
综述

执行最小约束的GPS平差后，这个命令用来保存校正坐标。校正坐标由WGS-84纬度、经度和在最小约束平差时生成的椭球高度组成。

在用Trimble Geomatics Office软件执行点校正时，这些坐标作为GPS坐标使用。

要查看保存校正坐标对话框：

  选择平差 / 校正坐标 / 保存。

注：使用项目基准来平差网时，或平差里有地面数据时，这个命令无效。

注：保存校正坐标时，WGS-84校正坐标会为点保存。


    删除命令（校正坐标）

更多信息

如何做 ...	亦请参见
综述

校正坐标是WGS-8纬度、经度以及在WGS-84基准上最小约束GPS平差时生成的椭球高度。这个命令用来从项目里删除它们：

  选择平差 / 校正坐标 / 删除。


    禁用观测值命令

更多信息

如何做 ...	对话框	亦请参见
综述

当需要完全禁用一个显示在平差观测值列表里的观测值时，选择这个命令。完全禁用一个观测值，就是把该观测值从观测值列表里删除并且不再在平差里使用或重新计算。

注：禁用观测值不同于排除观测值。被排除的观测值还会继续出现在观测值列表里，但不会在平差里或重新计算时使用。

要禁用一个观测值：

1.	选择平差 / 观测值。观测值对话框出现。

2.	用鼠标右键单击相应的观测值，打开快捷菜单，然后选择禁用观测值。

观测值从观测值列表里删除，并且不再在平差里或重新计算时使用。

不能在观测值对话框里重新激活观测值，但可以选择一个观测值，然后从图形窗口里重新激活它的禁用属性。把观测值的状态从禁用改变到激活，它就可以重新激活了。


    校正坐标命令

更多信息

如何做 ...	对话框	亦请参见
综述

这个命令用来显示带有保存和删除校正坐标命令的子菜单。

要访问这个子菜单：

  选择平差 / 校正坐标。

包括以下命令的菜单出现：

  保存

  删除


    保存校正坐标对话框

更多信息

如何做 ...	亦请参见
综述

保存校正坐标对话框用来选择保存校正坐标的方法。

注：只有在平差基准设置为WGS-84，并且只有GPS观测值已被平差时，该选项才有效。

要访问它：

  选择平差 / 校正坐标 / 保存。

校正组的保存坐标包括以下选项：

已有点

如果您选择把它们保存在已有点下，那么坐标就保存为叫作校正集的附加坐标中。

带后缀的新建点

如果选择把它们保存在带后缀‘GPS’的新建点下，那么一个带有点名称“<点名称>-GPS”的新建点记录就被创建。保存校正坐标前可以更改‘GPS’后缀。

更多信息，请看保存校正坐标。


    椭圆控制工具条

更多信息

如何做 ...	亦请参见
综述

椭圆控制工具条允许筛选出现在平差后图形窗口中的误差椭圆、高度误差箭头和高程误差箭头。提供的控制功能也可用来缩放误差椭圆的尺寸并调整刻度线的大小。

要查看椭圆控制工具条：

  从测量视图中选择视图 / 工具条 / 椭圆控制。

  从测量视图工具条区域，用鼠标右键单击并选择椭圆控制。

椭圆控制工具条出现。可以再次选择这个命令来隐藏工具条。

注：也可以在查看选项对话框中用误差椭圆控制标签来控制误差椭圆的显示。

下列工具条按钮有效：

	该按钮切换误差椭圆命令。切换该命令相当于在查看选项对话框内选择和清除显示点误差椭圆和箭头检查框。按钮切换到开时，高度误差和高程误差命令（按钮）可变为有效。
	该按钮切换高度误差命令。误差椭圆命令切换到开时按钮才有效。
	该按钮切换高程误差命令。误差椭圆命令切换到开时按钮才有效。

也可以使用下列控制工具：

误差椭圆比例尺

下面所示的误差椭圆比例尺用来控制平差后出现于图形窗口的误差椭圆尺寸。

向左滑动控制条可以减少椭圆尺寸，向右滑动控制条可以增加椭圆尺寸。

刻度线尺寸

下面所示的控制工具用来调整误差椭圆条比例刻度距离。

回旋调节钮控制显示在图形窗口中刻度线之间的距离。如果增大刻度线之间的大小和距离、从而更好地匹配出现于刻度线尺寸控制项的数值，则条比例尺将变长。反之亦然。


    椭圆控制命令

更多信息

如何做 ...	亦请参见
综述

选择这个命令来显示或隐藏椭圆控制工具条。

显示或隐藏椭圆控制工具条：

  选择视图 / 工具条 / 椭圆控制。

每次执行这个命令时，工具条都会显示或隐藏。

注：也可以从查看选项对话框的误差椭圆控制标签配置误差椭圆控制。


    误差椭圆命令

更多信息

如何做 ...	亦请参见
综述

误差椭圆命令在椭圆控制工具条上有效。这个命令用来筛选出现在平差后图形窗口中的误差椭圆和箭头。当这个命令被选择时，工具条上的高度误差和高称误差命令按钮变得有效。

注： 误差椭圆命令相当于从查看选项对话框内选择点误差椭圆和箭头检查框。改变该检查框的状态也将改变当前误差椭圆按钮设置。更多信息，请看筛选误差椭圆和箭头。

要选择误差椭圆命令：

1.	查看椭圆控制工具条。

更多信息，请看显示和隐藏椭圆控制工具条 。

2.	要筛选误差椭圆和箭头，单击  [image] 。

误差椭圆显示或隐藏，取决于按下按钮时的最初状态。选择了误差椭圆按钮时，高度误差和高程误差按钮变得有效。如果选择了高度误差和高程误差箭头工具条，高度和／或高程箭头也将被显示。


    高度误差命令

更多信息

如何做 ...	亦请参见
综述

选择这个命令可以筛选平差后出现在图形窗口中的高度误差箭头。

注：在这个命令变为有效前，必须在椭圆控制工具条上选择误差椭圆命令，或者在查看选项对话框上选择显示点误差椭圆和箭头检查框。

要选择高度误差命令：

1.	查看椭圆控制工具条 。

2.	要筛选误差椭圆和箭头，单击 [image] 。误差椭圆显示或隐藏，取决于按下按钮时的最初状态。选择了误差椭圆按钮时，高度误差按钮变得有效。

3.	从椭圆控制工具条，单击 [image] 。

每次单击按钮时，高度箭头都会显示或隐藏。


    高程误差命令

更多信息

如何做 ...	亦请参见
综述

选择这个命令可以筛选平差后出现在图形窗口中的高程误差箭头。

注：在这个命令变为有效前，必须在椭圆控制工具条上选择误差椭圆命令，或者在查看选项 对话框上选择显示点误差椭圆和箭头检查框。

要选择高程误差命令：

1.	查看椭圆控制工具条。

更多信息，请看显示和隐藏椭圆控制工具条 。

2.	要筛选误差椭圆和箭头，单击 [image] 。误差椭圆显示或隐藏，取决于按下按钮时的最初状态。选择了误差椭圆按钮时，高程误差按钮变得有效。

3.	从椭圆控制工具条，单击 [image] 。

每次单击按钮时，高程箭头都会显示或隐藏。


显示或隐藏椭圆控制工具条

 综述和更多信息

综述

椭圆控制工具条可用来控制出现在图形窗口中的误差椭圆和箭头的大小和显示方式。

要查看椭圆控制工具条，进行下列一项操作：

  从测量视图中选择视图 / 工具条 / 椭圆控制。

  从测量视图工具条区域，用鼠标右键单击并选择椭圆控制。

椭圆控制工具条出现。


改变误差椭圆的显示尺寸

综述

出现在图形窗口中的误差椭圆大小可以增加或减小。

要改变所显示的误差椭圆大小：

1.	查看椭圆控制工具条 。

更多信息，请看显示和隐藏椭圆控制工具条 。

2.	从误差椭圆比例尺，进行下列一项操作：

  向左滑动误差椭圆比例尺来减少椭圆尺寸。

  向右滑动误差椭圆比例尺来增加椭圆尺寸。

误差椭圆大小调整完毕。


调整误差椭圆条比例尺刻度
平差误差椭圆条比例刻度

综述

从椭圆控制工具条可以调整误差椭圆条比例刻度距离。

要调整误差椭圆条比例刻度距离：

1.	查看椭圆控制工具条。

更多信息，请看显示和隐藏椭圆控制工具条 。

2.	从刻度线尺寸控制，进行下列一项操作：

  单击旋转钮下部，减小误差椭圆条比例刻度距离。

  单击旋转钮下部，增加误差椭圆条比例刻度距离。

如果增大刻度线之间的大小和距离、从而更好地匹配出现于刻度线尺寸控制项的数值，则条比例尺将变长。反之亦然。


筛选误差椭圆和箭头

更多信息

亦请参见	如何做 ...
综述

平差后出现在图形窗口中的误差椭圆和箭头可以从误差椭圆工具条或查看选项对话框筛选。

注：查看选项对话框上的显示点误差椭圆和箭头检查框、以及椭圆控制工具条 上的误差椭圆按钮是互相链接的。

要从椭圆控制工具条筛选误差椭圆和箭头：

1.	查看椭圆控制工具条。

2.	要筛选误差椭圆和箭头，单击  [image] 。误差椭圆显示或隐藏，取决于按下按钮时的最初状态。选择了误差椭圆按钮时，高度误差和高程误差按钮变得有效。如果选择了高度误差和高程误差箭头工具条，高度和／或高程箭头也将被显示。

3.	从椭圆控制工具条，进行下列一项操作：

  要筛选高度箭头，单击 [image] 。

  要筛选高程箭头，单击 [image] 。

每次单击按钮时，高度或高程箭头都会显示或隐藏。

如果要从查看选项对话框筛选误差椭圆和箭头：

1.	选择视图 / 选项。查看选项对话框出现。

2.	选择误差椭圆控制标签 。

选择显示点误差椭圆和箭头检查框。

每次选择该检查框时，误差椭圆和箭头都会在开和关之间切换。


    属性窗口 - 估计错误页面

更多信息

 亦请参见

综述

估计错误页面显示网平差之后确定的点误差。这个页面只有在您安装了网平差模块后才有效。执行了平差后，您可以查看这个属性页面。

要查看估计错误页面：

1.	双击您想要查看的点。带有已选点的属性窗口出现。

2.	在测量标签里，单击估计错误按钮 [image] 。

估计错误页面出现。它包含以下域：

北坐标、东坐标

显示水平分量里的标准误差。

高程、高度

显示垂直分量里的标准误差。

置信度

显示传播误差结果的置信度水平。