Copyright: � 1999-2001 Trimble Navigation Limited


中断GPS处理进程

 概述和更多信息

一旦GPS基线处理过程开始，处理器就以一定的顺序连续的进行处理所选基线的passes。Passes的数目和每个passes的处理动作都受到GPS处理类型的设置和以前passes结果的影响。用户可以中断这个进程以取消当前GPS处理进程。

如果中断GPS处理进程，处理器在收到取消命令的同时将停止处理进程。注意，在一些情况下，单击取消与基线处理器收到这个消息之间有一时间延迟。

中断GPS进程：

1.	单击取消。GPS处理器显示一条确认消息。

2.	做下列之一：

  单击是确定取消处理进程。

  单击否继续进行处理同时放弃取消。


调整观测的时间范围

 概述和更多信息

静态或动态观测时段的时间范围可以调整到跨越更短持续时间的时间段。可以通过下列途径调整时间范围：

  编辑观测属性

  直接编辑观测要素

下面描述了调整时间范围的两种方法的使用说明

调整观测属性的时间范围：

1.	查看观测属性，做下列之一：

  双击观测要素

  右击观测要素，选择属性

Occupation/Data Segment Properties 对话框显示。

2.	编辑开始和结束的时间域

时间范围的持续时间可以减少。

3.	单击是

对话框关闭，观测要素就会显示出变化。要素以一个带有黑色边界的矩形形式显示出来。黑色边界意味着观测要素的原始时间范围，在填充了颜色的矩形内显示出编辑了的观测要素占用的时间范围。

调整时间范围：

1.	将鼠标移动到观测要素的主要的边界。

指针变成双线的水平箭头。

2.	按下鼠标左键向下拖动。

3.	向右拖动观测的主要边界，同时注视着时间标尺。

当主要边界移动时，填充的颜色将随鼠标一起移动，黑色矩形边界保持不变。

注：用户可以使用观测要素的空余部分（无填充色的区域）作为编辑了的观测的时间范围的指示器。

4.	当观测的主要边界与时间标尺上的适当的时间周期吻合时释放鼠标左键。

5.	重复以上的步骤调整观测的拖动边界，但是要以反向移动鼠标。


分析GPS基线处理报表

 概述和更多信息

GPS基线处理结束后，图形窗口可能出现警告标记。对于GPS基线，如果基线没有通过一条或多条当前激活的GPS处理类型中定义的质量检验标准，在基线中心就会出现一个标记。被标记的基线应该仔细检查以确定它们被标记的原因，并且使用另外不同的GPS处理类型通过故障排除技术去改善全部的基线解算质量。

日益增多的分析和改正用于每一条单独的基线数据。改正特殊的基线解算发现的任何问题，并且在分析下一条基线前重新处理这条基线。

在GPS基线处理报表统计中察看基线，并提出以下问题：

  解的类型是什么。

  如何对比率和参考方差进行比较。

  斜距是什么。

  是否有一条在不同的时间观测的多余基线用于比较斜距和基线分量。

如果答案可疑，请问：

  观测时间有多长

  是否 RMS小于15mm。

  是否跟踪概述显示处理了的时段的间隔。

  是否残余的区域对称出现在零点周围15mm范围内。

为了分析比率、参考方差和RMS测试，用户需要理解用于接受和拒绝基线解算的标准。

其余的GPS处理类型设置可以影响到这些接受测试的结果。用户应该形成一个对于这些设置的认识，可以理解结果是怎样被接受和拒绝的。若需更多的信息，请参见编辑高级类型对话框。

这些故障排除的技术可能或不能改善基线的统计。在返回域之前同一时间测试它们。列出这些技术为了简单和高效。故障排除使得野外重新观测一条或多条基线成为多余。

故障排除:

  关闭一颗卫星

  编辑周跳

  编辑不可用的测量数据

  评测以及提升高程系统

若需更多的有关基线处理过程的信息，请参见基线处理日志.


在SV图表中分析卫星跟踪数据

 概述和更多信息

一旦卫星跟踪信息被标绘在SV图标窗口中，数据可以被真实的分析检查是否有矛盾。

卫星跟踪信息的多重图表也能标绘在同一个SV图表窗口进行数据比较。新的窗口也能产生用来显示另外的一套或多套图表。

除了在屏幕上标绘数据外，图表可以打印出来，用于产生图表的信息可以以表格格式导出到一个文件。

标绘数据：

1.	察看时间线，做下列之一：

  选择View / Timeline.

  按Alt+VI.

时间线显示。

2.	单击一个数据文件夹。

数据文件夹出现在控制栏r。当数据文件夹关闭时出现一个 [image] 符号，当它们全部关闭时出现一个 [image] 符号。

据文件夹显示出采集数据的接收机的类型和序列号。用户可以通过双击一个数据文件夹显示与采集的数据有关系的接收机的属性。

打开它，对于测量时间范围内的所有卫星的图标出现在控制栏内。

注：作为打开单独的文件夹的代替，打开所有命令可以打开所有的数据文件。

3.	双击一个卫星图标.

SV窗口显示

4.	显示卫星跟踪信息图表，做下列之一

  通过单击对话框栏按钮选择一个或多个图表。

  从View / Data子菜单选择一条或多条命令。

所有观测时间范围内的对于所选卫星的采集的可用数据就会标绘出来。

5.	真实的检查所标绘出的卫星跟踪信息，查找数据中的矛盾所在。

一旦图表显示，用户可以执行下列操作：

显示图表的测量

1.	在图标中移动鼠标指针到所需的位置

2.	在状态栏读出测量和时间信息。

鼠标位置的值和数据采集的时间出现在状态栏。

打印图表：

1.	选择打印命令，做下列之一：

  选择 File / Print.

  按 Ctrl+P.

  在工具栏单击 [image].

打印对话框出现

2.	选择所需的选项

3.	但击是

图表被打印。

打印图表到一个文件

1.	选择打印命令，做下列之一：

  选择File / Print.

  按Ctrl+P.

  在工具栏单击 [image].

打印对话框出现。

2.	选择打印到文件选项

3.	单击是。

图表被打印到一个文件。许多程序可以导入打印到文件图形数据。这对于报表中包括的图表是有用的。

打印表格数据：

1.	选择导出命令，做下列之一：

  选择File / Export.

  按Alt+FE.

文件导出对话框显示。

2.	选择保存文件的目录和文件名。

用来产生图表的卫星轨迹信息被写入一个文本文件并保存在所选的文件家。文件中的数据以表格的格式写入。当多重图表在同样的SV图表窗口中显示时，每一种类型的图表包括一列表格数据。


改变一个静态观测的类型

 概述和更多信息

可以改变一个静态的动态时段的观测类型。

改变观测类型：

1.	双击观测要素。观测/数据段属性对话框显示。

2.	打开时段类型列表。

3.	选择一个观测类型。从这些选项中选择：

  静态观测

  连续时段

  流动时段

4.	单击是。

变化被保存。

警告：一旦变化生效，用户不可能将连续或流动时段变回为静态观测，当进行这项变化时使用警告。


改变一个连续时段的类型

 概述和更多信息

可以改变一个连续的动态时段的观测类型。

改变观测类型：

1.	双击观测要素。观测/数据段属性对话框显示。

2.	打开时段类型列表。

3.	选择一个观测类型。从这些选项中选择：

  连续时段

  流动时段

4.	单击是。

变化被保存。

注：用户仅能将连续时段变为流动时段。不可能将连续或流动时段变为观测。


改变时间选项

 概述和更多信息

时间标尺中的时间单位能设置到GPS周/秒或Windows当地时间中。

改变时间单位：

1.	显示时间选项对话框，做下列之一：

  双击时间标尺。

  右击时间标尺选择时间选项。

显示时间选项对话框。

2.	选择这些时间格式之一：

  时间显示格式相应的当地时间

  GPS周/秒

3.	单击确认。

更新时间标尺中的起始和结束时间区域显示时间单位的改变。该操作也影响显示在时间线属性对话框，Skyplot，DOP图表，SV图表，和状态栏中的时间单位。


改正GPS观测值中的周跳

 概述和更多信息

能编辑在GPS观测值的卫星跟踪图表中发现的周跳有选择性地把它们从将来的GPS基线处理时段中移去。仅仅应该在由于严重的剩余观测值和使用时间线发现的大量周跳所标记的基线解的情况下编辑周跳。

注：在大多数情况下基线处理器自动处理周跳不需要手工编辑。通过检查时间线中GPS观测值在处理GPS基线前或后可以探测周跳。有问题的数据在GPS观测值的卫星跟踪图表中有异常表现。周跳的表现和卫星跟踪信息中的其它间隙在GPS观测值中举例说明。

编辑周跳：

1.	打印有标记的基线的GPS基线处理报告。

Trimble建议用户打印处理前有标记的基线解的处理结果。随后重新处理基线解时，用户能使用数据将结果和下一GPS基线处理时段所采集的结果相比。

2.	检查周跳的GPS观测值的可视符号

3.	拖拉周跳周围的选项矩形。

时间线自动选择L1和L2 载波的跟踪信息。在第6步中，用户将删除所选的L1和L2载波数据的选项。

4.	查看GPS观测属性，做下列之一：

  双击选择矩形。

  右击选择矩形和选择属性。

GPS观测属性对话框出现。

5.	编辑一个或两个开始和结束时间域。

如果用户调整时间以忽略数据，周跳将从GPS基线处理时段删除。以后，当用户重新处理基线时，处理器对于确定标记的基线的新的解时忽略数据。

6.	从可用的观测类型清除检核标记。此项决定了对于特殊的时间范围的观测类型将被禁用。

7.	单击是确定用户的改变。对话框关闭，并且禁用的选择矩形内的卫星跟踪数据的颜色变为灰色，意味着数据在未来的处理时段中将不再用于确定基线解。

8.	重新处理基线，选择测量/处理GPS基线。GPS处理对话框出现并且开始解算基线。

9.	从GPS处理列表中选择解。

10.	单击报表。GPS处理对话框显示。

11.	与先前的基线解算时段的结果比较基线的最新解。

12.	比较完两基线的处理时段结果，做下列之一：

  如果基线的斜距和静态解有改善，保存基线的结果。

  如果没有改善，返回到GPS观测属性对话框，重新启动禁用的观测类型，然后单击是。


改正GPS观测中不可用范围的数据

 概述和更多信息

在GPS观测值的卫星跟踪图表中发现无用的范围数据与发现周跳相比很少发生。在确实发生的不可能事件中，能编辑无用的范围数据有选择性地将它从将来的GPS基线处理时段中移去。仅仅应该在由于严重的观测残差的情况下编辑无用的范围数据并且它只有基于在时间线上的更进一步的检查发现它。

注：通过在时间线上检查GPS观测，不可用范围的数据可以在GPS基线处理前后探测到。有问题的GPS观测数据在卫星跟踪区域有明显的特征。不可用范围的数据、周跳和其它的卫星跟踪信息中的间隔的特征在GPS观测中以图例说明。

编辑不可用范围的数据：

1.	打印GPS基线处理报表的断头标记基线。

Trimble推荐用户在处理之前打印有断头标记基线的处理结果。如果基线解以后重新处理，用户可以将数据结果与为下一个GPS基线处理时段采集的结果相比较。

2.	检查GPS观测查看不可用范围的数据的可视标记

3.	拖动一个选择框围住不可用范围的数据

时间线自动的选择L1和L2载波的跟踪信息。在第六步，用户可以通过选项删除所选的L1和L2载波数据。

4.	查看GPS观测属性，做下列之一：

  双击选择框。

  右击选择框，选择属性。

GPS观测属性对话框显示。

5.	编辑一个或两个开始和结束时间域。

通过调整时间可以忽略不可用范围的数据，数据将删除不用于将来的GPS基线处理过程。以后如果用户解算基线，处理器将忽略数据，对受影响的基线确定一个新解。

6.	从可用的观测类型清除检核标记。这将确定对于指定的时间范围哪一个观测类型将被禁用。

7.	单击是确定用户的改变。

对话框关闭，并且禁用的选择矩形内的卫星跟踪数据的颜色变为灰色，意味着数据在未来的处理过程中将不再用于确定基线解。

8.	重新处理基线，做下列之一：

  选择测量/处理GPS基线。

  按F9.

GPS处理对话框出现并且开始解算基线。

9.	从GPS处理列表中选择解。

10.	单击报表。GPS处理对话框显示。

11	与先前的基线解算过程的结果比较基线的最新解。

12.	比较完两基线的处理时段结果，做下列之一：

  如果基线解有改善，保存基线的结果到项目中。

  如果没有改善，返回到卫星按钮然后重新启动卫星的测量。


禁用卫星

 概述和更多信息

用户可以在时间线检查GPS观测更好的理解基线解算中的问题。可能产生问题的情况包括：

  周跳，不可用的相位和L1、L2中的众多的间隔。

  .差的卫星状况，尤其一颗或更多卫星不可用。

注：禁用一颗卫星，则与此卫星有关的所有GPS观测也被禁用。也可能禁用个别的GPS观测和所选的GPS观测的区域。为了获得更多的信息，参见改正周跳和不可用范围的数据 。

禁用一颗卫星：

警告：禁用一颗卫星之前要确保删除卫星对卫星星群的几何形状没有负效应。

1.	查看时间线，做下列之一：

  选择查看/时间线

  按 Alt+VI.

时间线显示。

2.	确定数据文件夹包括数据。然后查找包括想要禁用的卫星的时间的测量要素。使用放大命令使测量要素填充满时间范围查看器。

用户可以以两种方式确定可用的文件夹：文件夹自身列出接收机的模型编码以及序列号，并且测量要素显示测量时段ID的标签。

3.	打开数据文件夹，单击 [image] 。

对于每一颗测量用到数据的卫星的按钮出现在控制栏，并且时间范围查看器显示每一颗卫星的GPS观测要素。

注：如果用户需要在时间范围查看器中显示所有卫星的数据，重新定义时间线查看区大小。

4.	在GPS观测要素中查找间隔。

位于L1和L2载波中的间隔可以显示卫星信号的周跳，不可用范围误差和其它的信号损失问题。为了获得更多的有关周跳和其它的载波信号损失问题的特征，参见GPS观测。

5.	右击一个卫星按钮。

6.	选择启动/禁用。当数据禁用后，GPS观测要素变为灰色。

7.	选择基线。

8.	重新处理解，做下列之一：

  选择测量/解算GPS基线。

  按F9.

GPS处理对话框显示，开始解算基线。

9.	从GPS处理列表中选择解。

10.	单击报表。GPS基线处理报表显示。

11	将处理的结果与先前处理的结果比较。

12.	比较完两个处理时段的结果，做下列之一：

  如果改良了基线，保存基线解到工程中。

  如果没有显示改良，返回卫星图标重新激活卫星的观测值。


禁用时间线的中GPS观测

 概述和更多信息

在时间线中，用户可以禁用个别的GPS观测要素，GPS观测组，或一颗卫星的全部GPS观测。禁用GPS观测之前，要确保删除卫星对卫星星群的几何形状没有负效应。

注：可以编辑选择的GPS观测的区域和原始的卫星跟踪信息以改善全部的观测质量。若需此技术的一个例子，参见改正不可用的范围数据。

禁用个别的GPS观测

1.	单击激活的GPS观测。

2.	右击GPS观测

3.	选择启动/禁用。

激活的GPS观测被禁用，显示禁用状态。

禁用GPS观测组：

1.	拖动一个选择矩形框围住GPS观测组。

2.	在矩形框内右击。

3.	选择启动/禁用。

激活的GPS观测被禁用，显示禁用状态。

禁用一颗卫星的全部GPS观测：

1.	单击与GPS观测相关的卫星图标。

2.	右击图标。

3.	选择启动/禁用。

卫星和所有的相关的GPS观测都被禁用。


编辑GPS处理的接受标准

三个GPS处理质量测试（比率测时，参考方差测试，标准差测试）用作质量接受标准来接受和拒绝基线解。

编辑接受标准：

1.	查看GPS处理类型对话框，做下列之一：

  选择测量/GPS处理类型。

  按Alt+UP。

GPS处理类型对话框出现。

2.	从列表中选择激活的类型：

3.	单击编辑。编辑类型对话框出现，类型的名字位于标题栏。

4.	单击高级。编辑高级类型对话框出现。

5.	选择质量标签。接受标准组包括检核对话框用来禁用和启动三个接受测试。对话框中显示有关的If Ratio， If Reference Variance，和If RMS域。每一个测试包括四个数据输入域。两套标记和失败域存在，一套用于单频接收机，另一套用于双频接收机。

注：当单频接受标准用于一条基线时，会出现两种情况。第一种是用于基线的接收机至少有一台是单频接收机。第二种情况是基线的长度小于最终通过开关定义在激活的GPS处理类型的电离层标签。

6.	选择或清除If Ratio 检核对话框启动或禁用比率接受标准。

7.	打出单频或双频接收机的标记值。

8.	打出单频或双频接收机的失败值。

9.	选择或清除If Reference Variance检核对话框启动或禁用参考方差接受标准。

10.	打出单频或双频接收机的标记值。

11.	打出单频或双频接收机的失败值。

12.	选择或清除If RMS 检核对话框启动或禁用标准差接受标准。

13.	打出单频或双频接收机的标记值。

14.	打出单频或双频接收机的失败值。

15.	编辑编辑乘数并且单击确认。

保存改变。

注：对于大多数的测量应用，更改接受标准是不必要的。然而，对于代码最终通过解是例外的。典型的，代码最终通过解基于Trimble缺省的处理类型定义的标准被标记。如果用户照常规处理代码最终通过解，Trimble推荐用户设置有恰当的接收标准的代码解处理类型。


编辑GPS处理类型事件选项

GPS处理类型中的事件选项决定处理具有事件标记的连续动态测量时如何获得事件位置。

编辑事件选项：

1.	打开编辑高级类型对话框。

2.	在事件标签中，选择一个添加方法选项。

3.	在剩余区域，输入下列：

  适合的点的数量

  最大允许缺少的历元

  时间偏移（以微秒）

4.	如果不需要其它的改变，单击确定。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型电离层选项

 概述和更多信息

GPS处理类型中的电离层选项用于处理模糊解和最终反复处理时补偿电离层误差。

编辑电离层选项：

1.	打开编辑高级类型对话框。

2.	选择电离层标签。

3.	在模糊解通过组中，选择或清除比复选框长的应用所有基线启用或停用该选项。如果启用选项，输入适当的距离值。

4.	在最终通过组，选择或清除最终通过的比复选框长的应用所有基线启用或停用该选项。如果启用选项，输入适当的距离值。

5.	如果不需要其它改变，单击确认。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型动态选项

处理动态观测值时使用GPS处理类型中的动态选项。

编辑动态选项：

1.	打开编辑高级类型对话框。

2.	选择动态标签。

3.	在适当区域，输入下列：

  最小参考观测时间（以秒）

  最小静态初始化观测时间（以秒）

  最小已知点初始值（比率）

  最小OTF处理时间（以秒）

4.	如果不需要其它改变，单击确认。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型OTF搜索选项

GPS处理类型中的OTF搜索选项用于进行GPS反复处理期间的在线搜索。

编辑OTF搜索选项：

1.	打开编辑高级类型对话框。

2.	选择OTF搜索标签。

3.	在搜索方法组中，选择适当的选项。如果用户选择向前连续搜索或向后连续搜索选项，连续控制组中的区域变得可使用。

4.	输入最小搜索比率。

5.	如果不需要其它改变，单击确认。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型质量选项

GPS处理类型中的质量选项用于启用，停用，和定义在基线保存到工程中之前用于估计基线质量的比率，均方差，和参考方差检验。

默认地，接受检验标准不合格的基线不保存到工程中。标记的基线保存到工程中，但红色警告标志显示在基线中间表示应该检查该基线以确定它完全符合网。为了获得更多的识别为何标记基线的信息，参见数据分析。

编辑质量选项：

1.	打开编辑高级类型对话框。

2.	选择质量标签。

3.	在接受标准组中，选择或清除是否比率 ，是否参考方差和是否均方差 复选框启用或停用这些检验。

4.	选择适当的标记和每个检验都不通过的区域，输入需要的值。

注：Trimble建议用户不要改变适合大多数测量应用的默认设置。

5.	在编辑多重区域中，输入一个值。

6.	如果不需要其它改变，单击确认。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型静态选项

处理使用静态测量方法采集的基线数据时，使用GPS处理类型中的静态选项。

编辑静态选项：

1.	打开编辑高级类型对话框。

2.	选择静态标签。

3.	在最小基线观测时间区域，以秒输入一个值。

这是处理两台或多台接收机同时采集的观测值之前经过的最小基线观测时间。处理器需要120秒的同时数据处理接收机之间的基线。这移开了与多重流动接收机迭交的附属。默认值是120秒。

4.	在最大基线长度试图固定解组中，做下列：

  在使用广播星历的区域中，输入一个基线距离（以工程单位）。默认值为200公里。

  在使用精密星历的区域中，输入一个基线距离（以工程单位）。默认值为2000公里。

5.	如果不需要其它改变，单击确认。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型对流层选项

GPS处理类型中的对流层选项用于基线处理期间应用对流层改正。

编辑对流层选项：

1.	打开编辑高级类型对话框。

2.	选择对流层标签。

3.	在模型列表中，选择适当的对流层模型。

4.	在估计天顶延迟时间间隔中，以小时单位输入一个值。

最小的所建议的估计时间间隔是一个小时。默认值是两个小时。零值（0）表示没有天顶延迟估计。当对流层模型设置成没有时，该区域不可使用。

5.	计算GPS处理解时，选择使用所观测的气象数据复选框来选择所使用的气象数据的类型。气象数据包括相对湿度，大气压力，和温度。

  当选择复选框时，出现在数据文件或RINEX文件中的所观测的气象数据用于计算对流层天顶延迟时模拟对流层。默认地，选择该复选框。

  清除该复选框使用标准气象值代替记录的气象数据。

6.	如果不需要其它改变，单击确认。

保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型

 概述和更多信息

当编辑GPS处理类型时能显示两种标准的对话框。首先显示普通设置，显示一套选项高级设置调整GPS处理类型。最初，两个对话框使用Trimble Geomatics Office软件默认的适用于大多数测量应用的类型设置。

编辑普通类型选项：

1.	做下列之一：

  选择测量/GPS处理类型。

  按Alt+UP键。

显示GPS处理类型对话框。

2.	从列表中选择一种类型。

3.	单击编辑。显示编辑类型对话框。

4.	在高度截止角区域，输入一个高程截止角值。指定的高度截止角不考虑用于采集数据的高度截止角。

5.	在星历列表中，选择广播星历或精密星历。如果选择广播星历，GPS处理器使用所有对测量时段起作用的数据的卫星所接收的广播星历。如果选择精密星历，GPS处理器使用当前输入工程中的精密星历。

6.	在解类型列表中，选择代码，浮动，或固定。

7.	做下列之一：

  如果仅仅需要普通设置改变，单击确认保存改变。

  如果用户需要编辑高级选项，进行下一系列步骤。

编辑高级选项：

  在编辑类型对话框中，单击高级。

显示编辑高级类型对话框。包含下列标签：

  静态

  动态

  全球的

  质量

  对流层

  电离层

  事件

  OTF搜索

一旦用户已经在该对话框中编辑适当选项，单击确认。保存变化和返回编辑类型对话框。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


编辑GPS处理类型全球的选项

当通过每个GPS处理器后，考虑GPS处理类型中的全球的选项。

编辑全球的选项：

1.	打开编辑高级类型对话框。

2.	选择全球的标签。

3.	在频率类型列表中，选择L1，L2，窄巷，或宽巷。

4.	在剩余区域中，输入下列：

  最大固定周跳（以秒）

  最大重复（一个整数值）棗处理每条基线解时，GPS处理器将只处理最大重复数。

  最大整数搜索时间（单位为分的一个整数值）棗当时间值经过时，GPS处理器将中断进一步的重复处理，使用一个浮动解。

5.	如果不需要其它改变，单击确认。

保存改变。

注：对于大多数测量应用而言不需要修改高级控制。如果用户修改这些控制，在保存修改和赋值修改类型作为当前激活的类型之前，务必使用户知道这些改变的可能的影响。


通过基线距离编辑模糊解

模糊解GPS处理期间复选框启用或停用电离层模型改正。输入应用所有比区域长的基线中的距离值决定最小基线长度或使用电离层模型改正的开始。

注：电离层模型仅仅用于使用双频接收机观测的基线。

编辑该值：

1.	打开编辑高级类型对话框。

2.	选择电离层标签。

3.	在模糊解合格组中，选择应用所有比复选框长的基线。

选择复选框时，GPS处理器使用电离层模型改正电离层偏差。基于是单频或双频数据存在于工程数据库中自动选择电离层改正方法。当选择复选框时进行这些行为中的一个：

  如果使用双频接收机采集所有的工程数据，GPS处理器试图通过对比应用所有比区域长的基线中指定的距离长的基线使用电离层模型改正产生一个无电离层影响的观测值。在代码解中开始电离层改正，建模行为逐渐改进每个连续的解。

  如果至少使用一台单频接收机采集数据文件，GPS处理器使用包括在广播星历中的电离层数据来消除50%的电离层误差。

4.	在应用所有比区域长的基线中，以工程单位输入一个距离值。

默认地，模糊解合格的电离层模型改正用于超过10公里的基线。


过滤时间线要素

 概述和更多信息

命令用于时间线工具栏和过滤显示在时间范围阅读器中的图形要素的菜单中。

过滤星历图标

选择星历命令过滤显示在时间范围阅读器中的星历图标。每次使用时，该命令显示或隐藏星历图标。

过滤星历图标，做下列之一：

  右击时间范围阅读器背景，选择视窗过滤器/星历。

  从时间线工具栏，单击 [image] 。

过滤连续的动态观测时段

选择连续的命令过滤显示在时间线时间范围阅读器中的连续的时段要素。每次使用时，该命令显示或隐藏连续的图标。

过滤观测时段，做下列之一：

  右击时间范围阅读器背景，选择视窗过滤器/连续的。

  从时间线工具栏，单击 [image] 。

过滤卫星和相关的GPS观测值

卫星命令用于过滤显示在时间范围阅读器中的卫星和GPS观测值要素。每次使用时，该命令显示或隐藏卫星图标和GPS观测值要素。

过滤卫星，做下列之一：

  右击时间范围阅读器背景，选择视窗过滤器/卫星。

  从时间线工具栏，单击 [image] 。

过滤事件图标

选择事件命令 过滤显示在时间范围阅读器中的事件。每次使用时，该命令显示或隐藏事件图标。该按钮激活前，事件数据必须存在于工程中。

过滤事件：

  从事件线工具栏，单击 [image] 。


在GPS处理列表中移动列

 概述和更多信息

GPS处理列表中的列能移动到列表中新的位置。列移动是暂时的，当开始下一个GPS处理时段时，回复到原来的位置。

移动列：

1.	移动列标题上的指针。

标题包含列的标题并且位于首行数据之上。

2.	进行这些行为之一：

  把列移到右边，拖拉标题右边直到左边通过用户需要插入列的位置，然后释放鼠标按钮。

  移动列的左边，拖拉列标题左边直到右边通过用户需要插入列的位置，然后释放鼠标按钮。


通过时间线使用时间范围阅读器操纵

通过时间范围阅读器使用这些行为PAN时间线：

  使用卷轴栏转换时间线左边或右边。

  调整起始或结束时间区域PAN特殊的时期。

  使用缩放程度命令查看完整的时间线。

  使用缩放范围命令缩放所选要素时间范围阅读器的宽度。

  使用下一个命令PAN下一个观测终点。

  使用以前的命令PAN以前的观测起点。

使用这些行为纵向查看数据：

  拖拉时间线的顶部边界查看上部或下部区域显示或多或少的信息。

  在控制栏中打开和关闭数据文件夹查看更多信息。

  使用垂直的卷轴栏通过数据向上或向下移动。

考虑这些原则：

  用户能双击大多数时间线要素查看它们代表的数据属性。

  用户能右击大多数时间线要素和窗口背景查看命令菜单。每个菜单包括适用于所选窗口或要素的命令。

  时间线的特殊显示仅仅当选择一定的要素时才可使用。当选择卫星图标时，SV图表菜单仅仅作为菜单命令或当前激活的工具栏按钮来显示。同样，当选择观测值，测量，或星历图标时，DOP图表和Skyplot命令仅仅用于菜单和工具栏按钮中。

为了获得更多的信息，参见这些主题：

  查看以前的或下一观测值

  时间线数据文件夹

  时间线菜单

  时间线工具栏

  附属时间线显示

  时间线属性对话框

  时间线命令


划分原始的卫星跟踪信息

 概述和更多信息

在SV图表中通过从对话框栏或查看/数据菜单的选项中选择按钮来划分原始卫星跟踪信息。另外，划分数据，打印图表和把从卫星采集的信息输出到文件来证明图表。

划分卫星跟踪数据：

1.	查看时间线，做下列之一：

  选择视窗/时间线。

  按Alt+VI键。

显示时间线查看区域。

2.	单击数据文件夹。

数据文件夹显示在位于时间线查看区域的左下角的控制栏中，关闭时显示 [image] 符号，打开时显示 [image] 符号。数据文件夹显示用于采集数据的接收机的模型和序列号。当打开时，图标显示观测时间范围期间的所有卫星跟踪。

注：在打开单独文件夹的地方，扩大所有的命令能用于打开所有数据文件夹。

3.	双击卫星图标。

卫星图标加亮，SV图表窗口显示。

4.	划分数据，做下列之一：

  在对话框栏单击需要的按钮。

  从视窗/数据菜单中选择需要的图表命令。

一旦显示图表，用户就能进行这些行为：

显示图表观测值：

  移动鼠标指针穿过图表到需要的位置，在状态栏中读出观测值和时间信息。值记录在鼠标位置，数据采集时间显示在状态栏中。

在同一窗口中划分不同图表：

  从对话框栏或视窗/数据子菜单中选择需要的图表命令。

在同第一个图表一起的同一图表窗口中划分所选数据。

打印图表：

1.	做下列之一：

  选择文件/打印。

  按Ctrl+P键。

  从工具栏，单击 [image] 。

显示打印对话框。

2.	选择需要的选项。

3.	单击确认。

打印图表。

打印图表到文件：

1.	做下列之一：

  选择文件/打印。

  按Ctrl+P键。

  从工具栏，单击 [image] 。

显示打印对话框。

2.	选择打印到文件选项。

3.	单击确认。

打印图表到文件。许多程序能输出打印的图形数据到文件。这对于包括在报告中的图表是有用的。

打印表格数据：

1.	做下列之一：

  选择文件/输出。

  按Alt+FE键。

显示文件输出对话框。

2.	选择存贮文件的目录和文件名。

用于产生图表的卫星跟踪信息写到文本文件(*.txt)中存贮于所选的目录中。数据以表格格式写入文件。如果多重图表显示在同一SV图表窗口，表格数据的一列包括在每种图表中。

注：附加的图表窗口能使用文件/新的图表命令打开。每个窗口能显示单独系列的图表。用户能最小化和最大化窗口进行其它公共行为控制显示在SV图表中的窗口。


打印时间线查看区域

 概述和更多信息

时间线查看区域的内容能以图像或风景模式打印。

注：打印前，调整查看区域的大小。仅仅打印当前显示在查看区域中的数据。

打印时间线查看区域：

1.	查看时间线，做下列之一：

  选择视窗/时间线。

  按Alt+VI键。

2.	单击控制拦背景，时间范围阅读器，或时间标尺。

3.	查看打印对话框，做下列之一：

  选择文件/图表/打印。

  按Ctrl+P键。

显示打印对话框。

4.	打印查看区域，做下列之一：

  以图像模式打印查看区域，单击确认。

  以风景模式打印查看区域，单击属性，单击风景，单击确认两次。

时间线查看区域自动依比例适合纸的宽度或长度，然后打印。


处理基线

 概述和更多信息

能选择单独基线或系列基线来处理。

处理所有基线：

1.	打开包含原始GPS数据文件的工程。

2.	单击图形窗口背景。

用户必须单击没有划分数据的区域。该行为取消选定所有的所选项目。当图形窗口中没有选择基线时，基线处理器自动选择所有可能处理的基线。

3.	处理基线，做下列之一：

  从测量菜单，选择处理GPS基线。

  在工程栏中从Trimble测量组，选择处理GPS基线。

  在工程栏中从处理组，选择处理GPS基线。

  按F9键。

注：能在任何时候通过按取消键取消GPS处理时段。

状态信息显示在状态栏中作为GPS处理时段持续。这些统计显示：

  状态栏左边的进程指示器监控每条基线处理解的进程。

  第二指示器显示由GPS处理器产生的信息。单独的基线起点和终点作为时段连续来显示。

  处理的文件数量和处理的基线剩余数量从右边显示在第三个状态栏指示器中。所有基线处理完后和单击保存存贮解在工程中前，该指示器读取未决。

  远处右方的状态指示器摘要接受的和拒绝的基线解的数量。

作为GPS处理时段连续，每个所选基线的处理结果显示在GPS处理列表的摘要表格中。接受的基线解用显示在GPS处理列表左列的检查标志来识别。

单独的具有标志解的基线用图形窗口中的红色标志来标志。

处理基线解：

1.	从图形窗口，选择需要使用这些技术之一处理的基线：

  拖拉基线组周围的选项矩形。

  单击多重基线时按Ctrl键。

提示：用户能通过按Ctrl键和单击基线一秒来取消选择的基线。

2.	处理基线，做下列之一：

  从测量菜单，选择处理GPS基线。

  从工程栏中的Trimble测量组，选择处理GPS基线。

  从工程栏中的处理组，选择处理GPS基线。

  按F9键。

显示GPS处理对话框开始处理。

一旦处理基线，用户能查看GPS基线处理报告和分析单独基线解的结果。为了获得更多的信息，参见分析GPS基线处理报告。

回顾单独解的报告数据后，用户能保存基线解。

注：处理基线和关闭GPS处理对话框后，用户能双击测量视窗状态栏中的警告标志指示器。双击打开具有与它们相关的警告标志的基线选项的属性窗口。用户能打开选项列表中的基线文件夹识别为何标记这些基线。警告页将识别是否基线未通过比率，均方差，或参考方差接受标准和标记基线的其它原因例如环不闭合。理解为何标记基线在防止再次发生相同问题上可能有用。为了获得更多的信息，参见分析GPS基线处理报告。

这里有许多处理GPS数据的考虑事项。为了获得更多的GPS基线处理信息，参见这些主题：

  确定潜在的基线

  选择基线处理

  选择GPS处理类型

  开始基线处理

  查看处理结果

  保存处理结果

  重新处理基线


重新处理有问题的基线

 概述和更多信息

解决问题技术依赖于观测时段时间的长度。如果有问题的基线有足够的数据，和足够的可见卫星，在时段的开始或结束时缩短观测时间。如果时段开始或结束时的数据有噪声，或存在周跳，该程序特别有用。

重新处理基线：

1.	查看时间线，做下列之一：

  选择查看/时间线。

  按Alt+VI键。

2.	扩大包含测量数据的数据文件夹。

3.	右击GPS观测值。

4.	选择属性。显示GPS观测值属性对话框。

5.	打出新的起始和结束时间。

6.	单击确认。

7.	单击有问题的基线。

8.	处理基线，做下列之一：

  从测量菜单，选择处理GPS基线。

  从工程栏中的Trimble测量组，选择处理GPS基线。

  从工程栏中的处理组，选择处理GPS基线。

  按F9键。

重新计算单独的基线解，结果显示在基线处理对话框中。


时间线中选择观测值

 概述和更多信息

图形窗口和时间线相互连接。当从图形窗口或时间线查看区域选择要素时，顾及这些原则：

  如果用户在时间线中选择观测值，所选点也在图形窗口中选择。

  如果用户在图形窗口中选择一条基线，时间线选择两个观测值弥补基线。

  如果用户在图形窗口中选择一个点，时间线选择所有的与点相关的观测值。

彩色译码方案用于识别不同类型的观测值和显示在时间范围阅读器中的数据时段。为了获得更多的信息，参见彩色译码方案。

在时间线中选择观测值：

  单击观测值。

观测值加亮显示它被选择。

通过在图形窗口中选择一条基线来选择观测值：

  在图形窗口中单击基线。

在时间范围阅读器中选择与基线相关的两个观测值。

通过在图形窗口中选择一个点来选择观测值：

  拖拉点周围的选项矩形。

在时间范围阅读器中选择与点相关的观测值。

提示：观测值和点也能从属性窗口中选择，反过来也是一样。当在时间线或图形窗口中工作查看所选实体的属性时，用户也能打开属性窗口。


设置GPS基线处理报告

能启用或停用GPS基线处理报告的选项来控制报告的内容。

设置报告：

1.	查看GPS基线处理报告设置对话框，做下列之一：

  选择报告/设置/GPS基线处理报告。

  按Alt+RSO键。

显示GPS基线处理报告设置 对话框。

2.	选择或清除复选框控制包括在GPS基线处理报告中的部分。


开始GPS处理

 概述和更多信息

开始GPS处理：

1.	在测量视窗中，选择需要的基线。如果没有选择，处理所有潜在的基线。

2.	做下列之一：

  从测量菜单，选择处理GPS基线。

  从工程栏中的Trimble测量组，选择处理GPS基线。

  从工程栏中的处理组，选择处理GPS基线。

  按F9键。

打开GPS处理对话框开始处理。

注：在任何时候取消GPS处理时段，单击取消。

状态信息显示在状态栏中作为GPS处理时段连续。显示下列统计：

  状态栏左边的进程指示器监控每条基线处理解的进程。

  第二指示器显示由GPS处理器产生的信息。单独的基线起点和终点作为时段连续来显示。

  处理的文件数量和处理的基线剩余数量从右边显示在第三个状态栏指示器中。所有基线处理完后和单击保存存贮解前，该指示器读取未决。

  远处右方的状态指示器摘要接受的和拒绝的基线解的数量。接受标准设置在GPS处理类型对话框中。

作为GPS处理时段连续，每个所选基线的处理结果显示在GPS处理列表的摘要表格中。GPS处理列表左列的检查标志识别接受的基线解。当基线没有通过质量接受检验标准时，不显示检查标记。

标记的基线通过，保存它们的解。一旦GPS处理时段结束确定为何它们未通过质量接受标准，检查这些。在图形窗口中用红色的标志标记标记的基线。

保存处理时段前拒绝单独的基线。

1.	从GPS处理列表中选择需要的基线解。

2.	清除左列中的复选框。

查看单独基线解的GPS基线处理报告：

1.	从GPS处理列表中选择需要的基线解。

2.	单击报告。显示GPS基线处理报告。

为了获得更多的信息，参见GPS基线处理报告。

3.	如果需要，重复这些步骤查看附加的报告。

提示：GPS处理后，用户能查看基线的GPS基线处理报告。在图形窗口中，选择需要的基线，然后选择报告/GPS基线处理报告。

所有接受的基线解都能保存到工程中。

重写多重基线解复选框控制重新处理后如何保存基线。选择默认值，意味着重写现有的解。如果清除复选框，增加新的解到工程，保留旧的解。当这个发生时，新的解变成当前激活的解，以前的解变成不激活。属性窗口用于将以前的解变回当前激活的解。

重写多重基线解复选框仅用于处理超过一次的基线。它不影响从不同时间或不同天采集的GPS数据计算的相同两点之间的基线。建议用户总是重写多重基线解。

保存基线解：

  单击保存。

接受的基线解保存到工程中。

取消GPS处理时段：

  单击取消。

这里有许多处理GPS数据的考虑事项。为了获得更多GPS基线处理的信息，参见这些主题：

  确定潜在的基线

  选择基线处理

  选择GPS处理类型

  开始基线处理

  查看处理结果

  保存处理结果

  重新处理基线


查明高度截止角设置的故障

 概述和更多信息

如果停用所选卫星或GPS观测值数据后基线统计不改进，使用该查明故障程序。提高高度截止角可以消去噪声数据和改进基线统计。使用试错法接近提高的高度截止角。尝试一度一度地增加角度以免丢失好的数据。

估计高程：

1.	查看时间线，做下列之一：

  选择查看/时间线。

  按Alt+VI键。

显示时间线。

2.	单击需要的数据文件夹的 [image] 符号查看与计算的有问题的基线有关的单独的卫星。

3.	右击卫星图标。

4.	选择SV图表。

5.	单击高程查看卫星高度的变化。

6.	重复所有与基线相关的卫星决定是否增加高度截止角改进处理结果。

增加高程：

1.	查看GPS处理类型对话框，选择测量/GPS处理类型。显示GPS处理类型对话框。

2.	从列表中选择类型。

3.	单击编辑。显示编辑类型对话框。

4.	在高度截止角区域，输入新的高度截止角度。

5.	单击一次或多次确认直至对话框关闭。

6.	单击基线。

7.	处理基线，做下列之一：

  选择测量/处理GPS基线

  按F9键。

重新处理单独的基线

8.	检查结果。

检验是否查明故障程序改进了基线统计。


使用观测的GPS处理的气象数据

使用观测的气象数据复选框控制用于指定对流层改正的基线处理期间应该使用的所观测的气象数据。

注：下列步骤假设显示编辑高级类型对话框。

启用或停用气象数据的使用：

1.	选择对流层标签。显示对流层类型设置。

2.	设置使用观测的气象数据复选框选择计算GPS处理解时使用的气象数据类型。气象数据包括相对湿度，大气压力，和温度。考虑这些原则：

  当选择复选框时，GPS数据文件(.dat)，或使用RINEX文件输入的所观测的气象数据用于计算对流层天顶延迟时模拟对流层。默认地，选择该复选框。

  清除该选项使用标准的气象值代替记录的气象数据。

注：当记录气象数据在区域中时，使用已经校准确保适当读数的高质量仪器是非常重要的。使用没有校准或质量差的仪器获取的气象数据会降低基线解的精度。


在时间线中查看星历属性

 概述和更多信息

数据采集时段期间从单一接收机采集的广播星历中获得的信息用于时间线中。查看信息前，适用的数据文件夹必须打开。

对话框中的星历信息从广播星历中得到不能编辑。URA中的信息和健康区域特别有利，因为它们是从卫星传送的数据质量的指示器。

查看星历属性，做下列之一：

  双击星历图标。

  从时间线工具栏，单击 [image] 。

显示卫星星历属性对话框。


在时间线中查看观测值属性

 概述和更多信息

连续时段和静态观测值的属性能在观测值/数据时段属性对话框中查看。对话框选项自动更新反映所选观测值类型。

查看观测值属性：

1.	双击需要的观测值要素。显示观测值/数据时段属性对话框。

2.	查看属性后，单击确认。

注：用户也能编辑所选的属性，包括时段类型，观测的开始和结束时间，和天线属性。


在时间线中查看GPS观测值属性

 概述和更多信息

当显示时间线时，默认地打开卫星过滤器。用户能关闭过滤器隐藏GPS观测值。

从工具栏中过滤GPS观测值：

  从时间线工具栏，单击 [image] 。

如果GPS观测值显示，则隐藏；如果GPS观测值隐藏，则显示。

从时间范围阅读器过滤GPS观测值：

1.	右击时间范围阅读器背景。

2.	选择查看过滤器/卫星。

如果GPS观测值显示，则隐藏；如果GPS观测值隐藏，则显示。


在时间线中查看上一个或下一个测量时段

 概述和更多信息

下一个和上一个命令，在时间线工具览 用蓝色箭头图标表示，用于画出相对于下一个或上一个显示观测的开始或结束点的时间范围查看器。如果基线很长，很难画出有效的观测，这些命令非常有用。

使用下一个或上一个命令

1.	在时间范围查看器中选择观测要素。

2.	选择下一个或上一个命令，做下列之一：

  右击观测，选择下一个或上一个。

  从时间线工具览，单击 [image] 或 [image] 。

如果下一个被选，时间范围查看器画出下一个观测。

注：观测/数据时段属性对话框包括两个循环按钮。左边的键与上一个命令对应，右边的键与下一个命令对应。这些按钮可以用于画出下一个或上一个观测的时间范围查看器，同时，查看每一个观测的属性。

提示：用户可以通过选择一个观测或与观测有关的点画出时间范围查看器。从属性窗口选择一个观测或点将自动的选择可用的测量要素，并且画出有关的的观测要素的有关的时间范围查看器。如果工作在时间线上的同时，属性窗口显示。


查看基线统计

 概述和更多信息

可以用几种方法查看基线统计。它们可以在GPS处理时段过程中或完成后查看。

从GPS处理对话框中查看基线统计

1.	开始GPS处理

GPS处理对话框显示，处理时段开始。随着处理器不断解算，每个解出现在GPS处理列表中。为了获得更多有关信息，参见解算基线。

2.	对每一个解检查它们的比率，参考方差和标准差。

这些列表显示出比率，参考方差和标准差的检测结果。如果报告的结果在制订的GPS处理类型的接受标准内，接受基线解，检查标记显示在列表的第一列。当任何一个激活的检验报告不好的结果，没有检查标记显示在第一列。

注：标记的基线也被工程接受，但在图形窗口出现一个红色的警告标志。应该检查标记的基线的属性确定为何基线不通过接受标准，应该采取适当的行为改正不足。为了获得更多的信息，参见属性窗口。

3.	查看任何解的GPS基线处理报表，从列表中选择一个解并单击报表。显示GPS基线处理报表。

提示：用户也能双击基线查看报表。查看报表前，用户必须等待直到完成GPS处理时段。用户读单独基线的报表时，处理将继续。


查看GPS基线处理报表

 概述和更多信息

只要基线处理完成并且结果出现在GPS处理列表中，就可以查看一条基线的GPS基线处理报表。当用户查看GPS基线处理报表时处理器将继续解算基线。

查看GPS基线处理报表：

1.	查看GPS基线处理报表，做下列之一：

  在GPS处理对话框中双击一个基线解。

  选择基线，单击报表。

GPS基线处理报表显示。

2.	翻动报表检查数据：

检查在单行概览中不可用的基线解的详细资料。

根据野外记录的信息检查解中的测站信息。尤其注意的是：

  测站名字

  天线高，类型和测量方法

  开始和结束时间

检查每一个测站的卫星相位跟踪概要的L1或L2信号中断或间隔。固定直线代表一个干净的信号。线上的间隔或中断表示周跳或卫星信号的丢失。打勾标记表示接收机在一个周跳后继续接收卫星信号。

检查联合的卫星相位跟踪概要。灰色的代表基线解中实际使用的测量。

检查每一颗卫星的残余区域。这些显示确定基线解的每一颗卫星的RMS。


    处理GPS基线命令

更多信息

帮助 ...	对话框
选择该命令开始GPS处理时段：

  选择测量/ GPS处理。显示GPS处理对话框，开始GPS处理时段。


    基线处理报告命令

更多信息

帮助 ...	对话框
选择该命令查看GPS基线处理报告：

1.	选择需要报告的基线。

2.	选择报告/ GPS基线处理报告。显示GPS基线处理报告 。

该报告显示先前GPS处理时段的结果。利用它分析基线处理解的结果。

注：GPS基线处理报告也可从GPS处理对话框中获得。从GPS处理表中选择独立基线解，单击报告查看基线报告。


    时间线命令

更多信息

 又见

打开时间线视窗区域，在测量视窗中做下列之一：

  选择视窗/时间线

  从工具栏中选择 [image] 。

时间线视窗区域显示在图形窗口的底部。

在项目中时间线以基于时间的图形格式显示GPS测量的信息。在时间线中每块数据表示它的适当位置。时间线仅仅在测量视窗中可以获得。


    编辑类型对话框 - 概览

更多的信息

 帮助 ...

概览

使用此对话框确定如何处理GPS数据。

打开编辑类型对话框：

1.	选择测量/GPS处理类型。GPS处理类型对话框出现。

2.	从列表中选择类型。

3.	单击编辑。编辑类型对话框出现。

如果用户需要获得更多的高级类型控制对GPS基线处理器进行微调，单击高级。编辑高级类型对话框出现。

截止高度角

编辑此域设置GPS基线解算的最小的卫星高度。此设置越过用于野外采集的观测数据的截止高度角。

考虑以下帮助：

  进行基线解算时，Trimble Geomatics Office软件仅使用此高度以上的卫星。用户必须以度输入此值。缺省的值是13度。

  用户可以设置高于或低于截止高度角的值用于野外采集观测数据，但通常设置高一点的值。在野外设置低一点的值对于处理数据没有影响。

  此设置对于几台接收机同时采集数据而截止高度角又不统一时非常有用。此域越过这些截止高度角设置并且对于基线解算使用一个常量。

  增大截止高度角值从GPS处理结果中删除高度低的卫星。这些卫星信号受到因为信号遮挡和长路径通过对流层而产生的噪声的影响。

  过大的增加截止高度角值会因为减少了卫星星群中可用的卫星数而影响GPS处理结果。

星历

从此列表中选择解算基线所用的星历类型。

  广播星历�对于大多数情况，它是缺省的。广播星历由每一颗卫星周期性的发送，一般以小时为单位发送。星历包括了卫星的轨道参数。

  精密星历�可以改善基线的精度。经常的，精密星历可以帮助用户获得长基线的固定模糊度解。使用此选项，一个甚至更多的精密星历必须导入到项目中去。

使用精密星历进行基线解算，导入到项目中的精密星历必须包括处理的数据的早于和晚于时间间隔SV位置的至少8项设置。因为大多数的精密星历每15分钟提供SV位置，这就意味着用户必须拥有比测量时间的开始和结束分别多出2小时的精密星历。如果测量开始的时间在0:00UTC左右，用户必须将两天的精密星历数据结合以保证适当的覆盖。

精密星历文件包括了所有卫星整周的信息。然而，当前最普通可用的文件仅包括一天的数据。精密星历文件可以以SP3和EF18格式获得。Trimble Geomatics Office可以使用任何格式。

精密星历文件可从下列机构获得：

  美国大地测量局 (NGS)

  欧洲定轨中心(CODE)

  欧空局 (ESA)

  Scripps Institute Observatory (SIO)

  加拿大能源部 (EMR)

  美国宇航局的喷气动力实验室 (JPL)

  美国海洋气象局(USNO)

解类型

从此列表选择基线处理器的最终通过解的类型。

基线处理器根据可利用的观测类型和当前激活的处理类型以一定的顺序解算每一条基线。解算由一个代码解开始，接着进行三次差分和两次差分载波解。选择最终通过解代表了给出的一套观测和控制所能获得的最优解。

最普通的解的类型是用于短基线的L1 固定 和其余大多数情况的无电离层影响的固定 解。如果用户解算很长的基线，无电离层影响的浮动解 可能获得的最优解。

下列选项是可用的：

  代码�使用此选项执行代码解。如果选择了此选项，GPS处理器在解完代码解后停止处理。

  浮动--使用此选项生成一个没有解决固定整周模糊度的浮动解。在一些特殊情况下，缩短处理时间是有益的。此选项是有用的，例如，如果解算很长的基线，浮动解是仅能获得的解。选择浮动解作为解类型可以防止GPS处理器执行长时间的整周搜寻。

其它的用于定义产生浮动解的控制包括：

  试图固定解的最大的基线长度

  最长的整周搜寻时间

这两项控制位于编辑高级类型对话框。

  固定解--使用此选项完成一个固定整周数解。这是缺省并且首选的解。

注：当产生了一个指定的代码最终通过GPS解类型，用户应该在质量标签中编辑接受标准组。代码解就基于Trimble缺省的处理类型应用的标准标记出来。根据正确的接收标准，代码处理类型将确保基线解算结果的正确性。

高级

单击高级查看和编辑当前激活的GPS处理类型的高级控制。


    编辑高级类型对话框 - 静态标签

更多的信息

 帮助 ...

编辑这些控制来改变用于解算静态和快速静态的基线设置。

查看编辑高级类型对话框的静态标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择静态标签

最短的基线观测时间

编辑此域在考虑基线解算之前设置两个同时观测的得测站的重迭时间。它控制着项目中可能的基线的增加。

缺省的，解算接收机间的基线，处理器要求120秒的同时观测数据。它削去了多重流动间的偶然重叠。

对于固定解的最大基线长度

在此组中编辑域定义基线处理器生成一个固定解的最大基线长度。对于长于此值的基线将得到浮动解。

下列域是可用的：

  使用广播星历�编辑此域设置使用广播星历解算固定基线解的最大的基线长度。GPS处理器将不对长于此基线长的基线进行固定解解算。缺省的是200公里。

  使用精密星历�编辑此域设置使用精密星历解算固定基线解的最大的基线长度。GPS处理器将不对长于此基线长的基线进行固定解解算。缺省的是2000公里。


    编辑高级类型对话框 - 动态标签

更多的信息

帮助 ...	又见
编辑这些控制来改变用于解算动态的基线设置。

查看编辑高级类型对话框的动态标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择动态标签

最短的参考观测时间

编辑此域定义在一处理时段中相对于其余的观测的动态参考站所需的最短观测时间。

考虑下列的帮助：

  此域中的值可以禁止GPS处理器处理从几个不同的数据文件导入到项目中的重叠的共同观测。这些观测由两个以上流动站同时观测采集。如果某一流动站在测站保持不动的时间长于这个时间，流动站就会被认为是参考点并且其它的几个流动站采集的共同观测数据相对于此点进行处理。

  考虑到动态测量利用一单个基准站和两个流动接收机，如果没有这个最少的参考观测时间，GPS处理器将试图处理基准站与流动站间的数据以及两流动站间的数据。

  缺省的是600秒。缺省的最少的参考观测时间通知GPS处理器仅对超出600秒或10分钟的观测考虑参考点。

  设置此域值为0，将解算流动接收机间的基线。

最短的静态初始化观测时间

编辑此域定义对于一特殊动态处理时段用作静态初始化的基线所要求的最短观测时间。

考虑下列的帮助：

  缺省的设置要求基线用作任何初始化目的之前至少被观测120秒或2分钟。

  超出此值的基线将当作静态基线进行处理并被保存到项目中用作静态初始化。

最小的已知点初始化比率

编辑此域改变动态GPS处理期间用作已知点初始化的最小接受比率。

已知点初始化开始于两已知点的逆转。从此逆转中获取的信息被认为好像是一条固定基线。基线处理器利用从逆转固定获取的基线解求卫星的模糊度。这一步包括了整周搜寻，与处理静态或快速静态时做的一样。

用作判断搜寻成功的比率与正常的固定整周解一样。如果搜寻的比率大于最小的已知点初始化比率，GPS处理器接受结果并利用它们为后来的动态处理做初始化。

缺省的最小的已知点初始化比率是3.0。此值大于静态或快速静态解的正常开关值1.5。比率值较高因为处理器仅解出卫星的模糊度，并且由于涉及到更少的变量。

最短的OTF处理时间

编辑此域改变GPS处理解算整周模糊度on-the-fly所需的最短持续时间。

考虑下列的帮助：

  接收机必须连续工作200秒并且锁定至少4颗卫星用来进行OTF初始化。缺省的是200秒和5颗可视卫星。

  如果没有任何静态初始化信息，GPS处理器将试图使用观测期间至少有200秒历元和星群中的4颗可视卫星的数据解算整周模糊度。因为卫星星群不断变化，4颗卫星最好组合方式的数据将进行处理，并且4颗同样的卫星对于全部的观测是不必要的。

  如果执行了所有的静态和固定基线初始化后，任何模糊度仍然存在，GPS处理器将使用OTF初始化技术。GPS处理器不对少于此时间间隔的动态处理时段使用OTF初始化技术。这些时段必须使用静态或固定基线初始化技术进行初始化。


    编辑高级类型对话框 - 质量标签

更多的信息

帮助 ...	又见
编辑这些控制用来改变数据和处理并在保存到项目中之前的结果的辨识和编辑。此页上的控制用来辨识哪一条基线解通过，哪一条基线解被标记，哪一条基线解失败。

查看编辑高级类型对话框的质量标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择质量标签

接受标准

编辑此组中的域改变用于确定基线解算结果类型（通过，标记，失败）的接受标准。缺省的，这些标准也用于确定哪一种基线解应该在解算完成后保存到项目。

考虑以下的帮助：

  标记和失败域可用于标准差、比率和参考方差。有关这些测试的信息，参见下列主题：

  If RMS 复选框

  If Ratio复选框

  If Reference Variance复选框

  可定义单独的标准用于单频和双频基线解。确定用于单频和双频基线的接受标准必须联合考虑以下几项：可用到的GPS测量类型，当前激活的GPS处理类型选择的解类型以及由基线处理器自身确定的最终解。

  接受检验可以基于任何的使用标准差、比率和参考方差联合检核。缺省的使用所有的三项质量参数来确定通过/标记/失败状态。如果多于一个质量因子联合使用，状态基于最差的情况。例如，如果比率和参考方差通过，但是标准差失败，基线收到失败的状态。缺省的使用所有的三项检验。

注：对于大多数的测量应用，并不需要修改接受标准。然而，对于代码最终通过解是例外的。代码最终通过解由Trimble缺省的处理类型提供的标准标记。如果处理代码最终通过解，建议用户建立一个具有适当的接受标准的代码处理类型。

编辑乘数

编辑此域改变用于删除连续的GPS处理迭代的界外值的开关值

基线处理器通过一系列的迭代解算基线。对于每一次迭代处理器做一标记并且删除解中的界外数据。通过历元到历元计算当前的解的观测残差。每一个观测残差与开关值进行比较确定是否观测值是超界的。

开关值是全部通过乘以编辑的乘数的观测残差获得的的RMS。如果发现了界外值，他们将被标记并在接下来的处理器迭代中删除。对于每一个迭代计算一个新的观测残差的全局RMS，并且此值用作基本的开关值用于标记和删除后来的观测。


    If RMS 复选框

更多的信息

 对话框

此复选框控制使用RMS来确定是否接受基线处理解。

RMS是测量中的一个测量噪声，小的RMS值被认为是较好的。小于标记值的RMS的值对于一个通过状态是有用的。大于标记值而又小于失败值的RMS的值对于一个标记状态是有用的。大于失败值的RMS的值会引起基线解算的失败。如果清除了此对话框，当确定接受标准时不考虑RMS值。

RMS检测包括两对域：单频标记和失败域以及双频标记和失败域。GPS处理器当执行RMS接受检测时仅使用两域中的一个值。使用的域的设置由所选的GPS处理类型的解类型决定。

接受测试可以联合使用标准差、比率和参考方差。缺省的使用所有的三项质量参数来确定通过/标记/失败状态。如果多于一个质量因子联合使用，状态基于最差的情况。例如，如果比率和参考方差通过，但是标准差失败，基线收到失败的状态。


    If Reference Variance 复选框

更多的信息

对话框	又见
此复选框控制使用参考方差来确定是否接受基线处理解。

参考方差是有关基线处理估计期望误差结果如何的度量标准。理想的参考方差值应该为1.0。小于1.0的值意味着遇到比期望少的误差。大于1.0的值意味着遇到比期望多的误差。基于参考方差的检测仅希望第二种情况，即遇到比期望多的误差。

小于标记值的参考方差的值对于一个通过状态是有用的。大于标记值而又小于失败值的参考方差的值对于一个标记状态是有用的。大于失败值的参考方差的值会引起基线解算的失败。如果清除了此对话框，当确定接受标准时不考虑参考方差值。

RMS检测包括两对域：单频标记和失败域以及双频标记和失败域。GPS处理器当执行RMS接受检测时仅使用两域中的一个值。使用的域的设置由所选的GPS处理类型的解类型决定。

接受测试可以联合使用标准差、比率和参考方差。缺省的使用所有的三项质量参数来确定通过/标记/失败状态。如果多于一个质量因子联合使用，状态基于最差的情况。例如，如果比率和参考方差通过，但是标准差失败，基线收到失败的状态。


    If Ratio

更多的信息

对话框	又见
此复选框控制使用比率来确定是否接受基线处理解。

接受测试可以联合使用标准差、比率和参考方差。缺省的使用所有的三项质量参数来确定通过/标记/失败状态。如果多于一个质量因子联合使用，状态基于最差的情况。例如，如果比率和参考方差通过，但是标准差失败，基线收到失败的状态。

比率是有关处理器解算固定整周解结果如何的度量标准，它的值越大越好。大于标记值的比率的值对于一个通过状态是有用的。小于标记值而又大于失败值的比率的值对于一个标记状态是有用的。小于失败值的比率的值会引起基线解算的失败。如果清除了此对话框，当确定接受标准时不考虑比率值。如果最终解的处理类型是浮动解或代码，忽略此比率。

比率检测包括两对域：单频标记和失败域以及双频标记和失败域。GPS处理器当执行比率接受检测时仅使用两域中的一个值。使用的域的设置由所选的GPS处理类型的解类型决定。

接受测试可以联合使用标准差 、比率和参考方差。缺省的使用所有的三项质量参数来确定通过/标记/失败状态。如果多于一个质量因子联合使用，状态基于最差的情况。例如，如果比率和参考方差通过，但是标准差失败，基线收到失败的状态。


    编辑高级类型对话框 - 对流层标签

更多的信息

帮助 ...	又见
编辑这些控制定义用于改变处理基线时对流层模型的选择和使用。

查看编辑高级类型对话框的对流层标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择对流层标签

模型

从此列表中选择对流层改正模型。当信号通过对流层时引入模型补偿误差。改正量随卫星的高度而变化。

下列选项是可用的：

  Hopfield − Hopfield 模型是缺省的

  Goad-Goodman

  Saastamoinen

  Black − Black模型对于低的卫星信号是不稳定的，它不适用于小于10度的高度角。

  Niell − Niell模型依赖纬度和季节，并且受卫星高度影响。

  None −选择此选项不使用对流层改正模型。

为了获得更多的有关通过对流层的GPS信号改正模型，参见Bibliography

估计天顶延迟间隔

编辑此域定义一个以小时为单位的天顶延迟间隔常量。

考虑以下的帮助：

  小时数必须以整数形式输入。推荐的最小估计间隔是1小时。缺省的是2小时。0小时导致没有天顶延迟估计。此域是不可用的如果不使用对流层改正模型。

  由于对流层不象电离层是动态的，超过两小时的信号延迟是缓慢的。如果解算长基线，并且有暴风雨经过接收机，缩短估计间隔。缺省的间隔是2小时。

  对于长于50公里的基线，广播星历中的误差将导致对流层参数估计误差。在这种情况下，应使用精密星历。

  对于小于10公里观测持续时间2小时的基线，估计天顶延迟没有太大作用。广播星历中的误差将导致对流层参数估计误差。在这种情况下，应使用精密星历。随着基线长度和观测时间的增加，对流层的影响会越来越显著。

使用观测的气象数据

选择此复选框定义解算GPS处理的解时所使用的野外采集的气象数据。气象数据包括温度、压力和相对湿度。

考虑以下的帮助：

  当选择了此对话框，GPS数据文件(.dat)或导入的RINEX文件中的观测的气象数据可用于计算对天顶延迟的模型。缺省的，此对话框被选。

  清除此选项，使用标准的气象数据取代记录的气象数据。

注：当记录气象数据时，使用经过校准读数正确的高质量仪器是非常重要的。使用没有经过校准或质量差的仪器采集的气象数据将降低基线解算的精度。


    编辑高级类型对话框 - 电离层标签

更多的信息

帮助 ...	又见
编辑这些控制定义用于改变处理基线时电离层模型的使用。

查看编辑高级类型对话框的电离层标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择电离层标签

模糊度解通过

在此组中选择复选框为模糊度解通过启用电离层模型。输入的值应用于所有的基线，长于域确定的接受的电离层改正的最小基线长度。

缺省的改正是用于双频接收机观测的基线且基线长度长于10公里的无电离层影响。广播的电离层模型用于使用单频接收机观测的基线。此选项仅控制着模糊度解期间的电离层改正的使用。单独的控制可用于最终通过电离层改正。

最终通过

在此组中选择复选框为最终通过启用电离层模型。输入的值应用于所有的基线长于域确定的接受的电离层改正的最小基线长度。

缺省的改正是用于双频接收机观测的基线且基线长度长于5公里的无电离层影响。广播的电离层模型用于使用单频接收机观测的基线。此选项仅控制着最终通过期间的电离层改正的使用。单独的控制可用于模糊度通过电离层改正。


    编辑高级类型对话框 - 事件标签

更多的信息

帮助 ...	又见
编辑这些控制用来定义用于计算事件方位和时间的内插表和时间偏移量。

查看编辑高级类型对话框的事件标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择事件标签

当接收机记录了事件的日志，一个事件标记被记入GPS测量的文件中。此事件标记包含了一个时间标签记录了事件发生的时间。因为事件很少发生在数据测量开始的瞬间，GPS处理器必须计算前述的接收机的位置和接着发生的事件，然后插入事件发生的位置。

内插方法

选择下列一种选项用于选择线性或二次内插方法，在解算连续动态数据期间获取事件方位

  线性内插�选择此选项通过使用事件发生的前后的基线解获得位置进行简单的线性内插。最少需要2个点，一般5个点用于线性内插。在合适的点数域中输入使用的点的数目。缺省的是2个点。

  二次内插�选择此选项通过使用事件发生的前后的位置进行二次曲线拟合内插。最少需要3个点，一般5个点用于二次内插。在合适的点数域中输入使用的点的数目。缺省的是3个点。

内插和最终的时间标签由下列的选项控制：

拟合的点数

编辑此域定义用于内插一个事件位置的点数。

输入的值用于控制线性内插和二次内插方法使用的点数。缺省的值用于线性内插是2个点，用于二次内插是3个点。如果没有足够的点，内插将不能进行。

允许丢失的最大历元数

编辑此域控制用于计算一个事件位置的允许丢失的最大历元数。

考虑以下的帮助：

  输入到此域的值用作事件为之内插方法的极限或开关值。如果丢失的数据测量历元超过此值，则基线处理器不进行内插事件位置的计算。缺省的值是0。这就要求至少有一个事件的开始和结束瞬间的数据测量。

  增大此值可以帮助恢复因为丢失数据而未能收到内插位置的事件。考虑到连续动态测量以1秒一个记录采集GPS测量数据，而且事件发生的时间标签时245742.2秒，如果允许丢失的最大历元数是0，在245742.0 和245743.0之间的连续的动态解一定可以用来内插事件的位置。如果245743.0时刻的连续的动态向量丢失了，事件的位置不能被内插。增加允许丢失的最大历元数到1，如果245743.0时刻的向量是可用的，则可以内插事件的位置。

注：过分的增加此值可能导致降低内插的位置的准确度。

时间偏移量

编辑此域使用接收机中一个事件的记录时间和事件发生的实际时间间的固定时间偏移量。

考虑下列帮助：

  输入的时间偏移量的单位是微秒并且可能是正值或负值。正值通过增加时间标签指定的微秒可以延迟事件的时间，负值则产生相反的效果。

  此值缺省的设置为0。在下列情况下改变此值，外部的设备连接到GPS接收机并且报告的事件时间与事件发生的实际时间之间有时间偏移量存在。考虑这种情况，一个航空照相机当拍照地形时快门被按下。照相机向接收机报告快门按下的时间，这将导致基于当前的快门速度的时间偏移量。如果快门的速度设置为1秒的1000 th，照片将在事件报告后1秒的1000 th的时刻捕获。对于这种自然现象，次域允许用户补偿时间偏移量。


    编辑高级类型对话框 - OTF 搜寻标签

更多的信息

帮助 ...	又见
编辑这些控制定义用于在模糊度解算通过期间如何执行OTF (On-the-Fly)搜寻。

查看OTF搜寻标签编辑高级类型对话框：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从类型列表中选择类型。

3.	单击编辑。编辑类型对话框显示。

4.	单击高级。编辑高级类型对话框显示。

5.	选择OTF 搜寻标签。

搜寻方法

在此组中选择一个选项控制在OTF(on-the-fly)动态处理期间使用的模糊度搜寻方法：

  最优搜寻�在初始化GPS处理通过期间选择此选项使用浮动值对于所有的模糊度估计。当所有的模糊度估计计算完后，如果可能，浮动模糊度可搜寻到并被固定为整数值。这是缺省的设置，它对数据提供最彻底的检查。

  前序搜寻--选择此选项在处理数据时使用前序搜寻。数据及时的向前搜寻，从最早记录的数据开始，到最近记录的数据结束。随着检查数据的增多的需要（例如，检测到周跳时）开始模糊度搜寻。前序搜寻比最优搜寻需要更少的时间。

  后序搜寻--选择此选项在处理数据时使用后序搜寻。数据及时的向后搜寻，从最近记录的数据开始，到最早记录的数据结束。随着检查数据的增多的需要（例如，检测到周跳时）开始模糊度搜寻。后序搜寻比最优搜寻需要更少的时间。

注：连续控制选项决定着检查的数据如何被拒绝。

连续控制

最小搜寻比率域是否能可用依赖于用户在搜寻方法组中选择的选项。使用此域定义在OTF (On-the-Fly) 搜寻中用于检查出的失败数据的拒绝标准。

用户可以编辑此比率用于在模糊度解通过期间拒绝搜寻检查的数据。如果搜寻的比率小域此域中输入的值，立即拒绝搜寻并且搜寻的模糊度不固定直到所有的数据经过检查。


    GPS处理类型对话框 - 概览

更多的信息

帮助 ...	对话框
概览

使用此对话框可以选择、查看、编辑、生成、拷贝、重命名和删除击获得GPS处理类型。打开它：

  选择测量/GPS处理类型。

GPS处理类型对话框显示。

下列控制是可用的：

类型列表

从列表中选择一个类型，激活它。在编辑、拷贝、重命名或删除一个GPS处理类型前必须激活它。当此对话框关闭时，当前的指定类型包括的控制将用于下一GPS处理时段。

编辑

单击此按钮查看和编辑当前的类型。

新

单击此按钮生成一个新的类型。新类型对话框出现。使用的是Trimble Geomatics Office软件的缺省的类型设置（在删除Trimble缺省的类型之前必须确定已设置了新的GPS处理类型）。

拷贝

单击此按钮拷贝当前的类型。拷贝类型对话框出现。

重命名

单击此按钮重命名当前的类型。重命名类型对话框出现。

删除

单击此按钮删除当前的类型。


    新类型对话框

更多的信息

帮助 ...	帮助 ...

使用此对话框生成新的GPS处理类型。

查看新类型对话框：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	单击新。新类型对话框显示。

名字

在此域中输入类型的新名字。类型的名字可以最多包括255个字符，短字符更容易在类型列表中发现和读取

注：单击是退出此对话框后，带有类型名称的编辑类型对话框显示。用户可以在此对话框中编辑普通的类型设置，单击高级编辑高级的设置。


    重命名类型对话框

更多的信息

使用此对话框重命名GPS处理类型

查看重命名类型对话框：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择可得到的类型。类型的名字选中。

3.	单击重命名。重命名类型对话框显示。

名字

在此域中输入类型的新名字。类型的名字可以最多包括255个字符，短字符更容易在类型列表中发现和读取。


    拷贝类型对话框

更多的信息

 帮助 ...

使用此对话框拷贝当前激活的GPS处理类型作为新类型的来源

查看拷贝类型对话框：

1.	选择测量/GPS处理类型。GPS处理类型对话框显示。

2.	从列表中选择拷贝的类型。

3.	单击拷贝。拷贝类型对话框显示。

名字

使用此域输入新类型的名字。类型的名字可以最多包括255个字符，短字符更容易在类型列表中发现和读取。

.注：单击是退出此对话框后，带有类型名称的编辑类型对话框显示。用户可以在此对话框中编辑普通的类型设置，单击高级编辑高级的设置。


    编辑高级类型对话框 - 全部的标签

更多的信息

帮助 ...	对话框	又见
编辑这些控制来改变设置对于动态和静态处理是通用的。

查看编辑高级类型对话框的全部的标签：

1.	选择测量/GPS处理类型。GPS处理类型对话框出现。

2.	从列表中选择一个类型。

3.	单击编辑。编辑类型对话框出现

4.	单级高级。编辑高级类型对话框出现

5.	选择全部的标签

频率类型

从此列表中选择最终GPS处理的频率类型。

  L1-使用此选向选择L1载波频率。缺省的是L1。

  L2-使用此选向选择L2载波频率。

  宽巷-使用此选向选择宽巷载波频率，可见波长大约86厘米，通过减去L1 和 L2载波或 L1-L2。

  窄巷-使用此选向选择窄巷载波频率，可见波长大约11厘米，通过增加L1 和 L2载波或 L1+L2。

考虑以下的帮助：

  如果最终通过控制在电离层标签上被选，这里指定的频率类型仅能用于下列基线：对于电离层最终通过的基线长度值小于开关值。对于电离层最终通过的基线长度值大于开关值的基线将得到无电离层影响解。

  如果项目数据包括的是单频接收机的观测数据，L2，宽巷和窄巷选项都不可用。只有所有的由双频接收机采集的数据才能使用L2，宽巷和窄巷选项。

最大可固定的周跳

编辑此域设置周跳的最大时间。处理器在处理基线过程中将试图固定它。

考虑以下的帮助：

  GPS处理器将试图固定少于或等于指定的时间范围的周跳。

  GPS处理器将不固定长于指定的时间范围的周跳。取而代之，GPS处理器对于每一个周跳边界的估计单独的模糊度。

注：通过使用时间线检查跟踪个别的卫星，发生在GPS测量过程中的周跳可以进行视觉检核。周跳在L1或L2载波沿时间线以图形方式显示为一个突变。为了获得更多信息，参见时间线。

最大的迭代次数

编辑此域设置处理基线解时基线处理器迭代的最大次数。用户可以输入1~99。

考虑以下的帮助：

  确定一条基线，每个解GPS处理平均执行三次迭代。如果必须进行10次迭代，基线解算的结果可能由问题。

  一般10次迭代是足够的。不要改变此域除非用户理解它对最小二乘平差的影响。

最大的整周搜寻时间

编辑此域用来限制基线解算在整周搜寻花费的时间。此控制起初用于解算长基线，特别是观测了很长时间的数据，例如24小时或更多。

考虑以下的帮助：

  对于特定的情况，例如差的参考站坐标，GPS处理器将搜寻几十亿次，这将需要几个小时的计算。此时间限制将停止指定时间内仍未完成计算的搜寻，然后以浮动解处理。

  缺省的是30分钟。


    GPS处理对话框

更多的信息

帮助 ...	又见
GPS处理对话框显示：

  处理状态

  解算完的基线数

  已经接受和拒绝的基线数目

打开GPS处理对话框：

1.	选择处理基线的设置

在图形窗口中基线选中

2.	开始基线解算，做下列之一：

  从测量菜单选择解算GPS基线

  从项目栏的Trimble Survey Group中选择解算GPS基线。

  从项目栏的Process Group中选择解算GPS基线

  按F9

GPS处理对话框出现，基线处理开始。

下列控制是可用的：

GPS 处理列表

查看此列表监控GPS处理时段的结果。

GPS 处理状态指示器

显示在状态栏左边的进度指示器监控着每一条基线解算的进度。单击这个指示器，GPS处理对话框重新居中。

第二个指示器显示由GPS处理器生成的信息。个别的基线在处理过程中显示出起点和终点。

在状态栏右边的第三个指示器显示出处理的文件个数和剩余的需要处理的基线个数。这个指示器工作在全部基线处理完和单击保存将结果保存到项目中。

最右边的状态指示器总结了接收和拒绝基线解的数目。

如果完成了一个处理时段，状态栏显示Pending，意味着基线已经解算完成但还没有存到项目中。当每一条基线解算完后，一单行基线概览以表格形式显示。

停止/保存

处理完成之前，用户可以单击停止中断进一步的解算而没有取消这条基线解算过程。解算完成之后，停止按钮变为保存按钮。选择保存将在GPS处理列表所选的结果保存到项目中去。在使用对话框中通过一个检核标志显示所选的基线解。如下所述，保存操作也受到覆盖原有的基线解复选框的影响。

取消

选择这个选项可在GPS解算开始后任何时候中断GPS解算过程。考虑以下方面：

  如果单击这个按钮时GPS处理已经完成，就会弹出一条确认信息。如果用户单击是，处理的结果就会被删除同时对话框关闭。如果用户单击否，就转回到GPS处理对话框。

  如果GPS处理过程中，按钮被按下，处理在完成当前基线解算后停止，同时弹出一条确认信息。如果用户单击是，处理的结果就会被删除同时对话框关闭。如果用户单击否，就转回到GPS处理对话框。

报表

选择这个按钮查看选定的基线解的GPS基线解算报表。只有从GPS处理列表中选择了一个基线解，按钮才能使用。

用户若要查看一个报表，不必等到所有的基线都解算完。只要第一个解出现在GPS处理列表中，报表就可以生成。

覆盖已有的基线解

此选项控制重新处理的基线如何保存。缺省的，复选框被清除，新的解添加到项目中，原有的解仍然保留。在这种情况下，新的解变为激活的解，原有的解变为不被激活的。属性窗口可以将以前的解变回为激活的解。

覆盖原有基线解复选框仅用于处理多于一次的基线。它并不影响相同两点间的由不同时间或不同天采集的数据计算的基线。Trimble 建议覆盖原有的基线解。


    GPS处理列表

更多的信息

对话框	又见
GPS处理列表已表格形式提供单线解概览。当每一条基线解算完后列表中增加一条线。显示的基线概览的顺序可以通过单击任何一列的标题控制。单击任何一列的标题通过列中的值分类。分类可以通过一个低的比率，高的标准差或高的参考方差快速的确定所有的基线。

处理列表包括以下各列：

使用

当已经处理了一条基线，使用复选框被选，并且，根据接受标准，结果或者通过或者被标记出来。如果没有通过基于比率，参考方差，标准差的标准检核，对话框被清空。仅对于选择了使用复选框的基线解当保存按钮使用时，它们才保存到项目中。

基线标识符

项目中用于此基线的观测标识符。

起始测站

基线的起点

结束测站

基线的终点。此点的坐标通过向起始测站坐标增加基线向量获得。

基线长度

基线的斜距。

解类型

由处理器决定的最终基线解类型。在大多数情况下，解的类型由以下几种：L1固定，L1浮动，无电离层影响固定解，无电离层影响浮动解。

比率

比率 用于评价最好与次好基线解间的差异关系（仅用于固定解）

参考方差

参考方差是基线解的实际误差与期望误差的关系。

注：总是一起评价比率和参考方差。低比率，高参考方差的基线应该进一步进行分析。

标准差

标准差 是测量解的均方根误差。

注：解的概览给出了一个简洁的GPS处理结果的概要。对个别基线解进行详细的分析，检查GPS基线解算报表。用户可以在此列表中所选的解处理完后单击报表立即获得此报表。用户若要查看个别基线的报表，不必等到所有的基线都解算完。处理器可以在用户检查每一个解的报表的同时连续的解算解线。

GPS处理对话框关闭以后，用户可以通过从图形窗口中选择基线和报表/GPS基线处理报表查看报表。报表中的信息可以从GPS基线处理报表设置对话框中定制。


    覆盖原有的基线解

更多的信息

 又见

此选项控制重新处理的基线如何保存。缺省的，复选框被选择，意味着覆盖已存在的解。如果复选框被清除，新的解将添加到项目中同时原有的解保持不变。在这种情况下，新的解变为激活的解，原有的解变为不被激活的。属性窗口可以将原有的解变回为激活的解。

覆盖原有基线解复选框仅用于处理多于一次的基线。它并不影响相同两点间的由不同时间或不同天采集的数据计算的基线。Trimble 建议覆盖原有的基线解。

另外的知识

处理GPS数据需要考虑多项内容。为了获取GPS基线解算更多信息，参见以下主题：

  确定潜在的基线

  选择需要解算的基线

  选择GPS处理类型

  开始解算基线

  查看处理结果

  保存处理结果

  重新解算基线


    GPS基线处理内容

内容

可利用下列的帮助主题：

  GPS基线处理概述

  处理GPS基线

  基线数据源

  GPS处理命令

  GPS 处理类型

  GPS 处理数据分析

  GPS 基线处理报表

  时间线

若想知道如何使用帮助，请按F1键

如果用户发现问题并且不能在帮助系统中找到所需信息，请与当地经销商联系或参见技术支持。

� 1999−2001, Trimble Navigation Limited. All rights reserved.


GPS 基线处理报表 - 概览
    GPS 基线处理报表 - 概述

更多的信息

帮助 ...	又见
概述

使用GPS基线处理报表察看基线解算的详细信息。

访问它：

1.	处理基线。GPS处理对话框显示。

2.	从GPS处理列表中选择一个基线解算。解算突出（高亮）显示。

3.	单击报表，用于基线解算的GPS基线处理报表显示。

GPS基线处理报表包括下列内容：

  处理概述

  基线分量

  观测

  跟踪概述

  残留的

  处理类型

报表中包括的部分由当前GPS基线处理报表设置对话框的设置和每一条基线处理数据的类型决定。


编辑高级类型对话框 - 概览
    编辑高级类型对话框 - 概述

更多的信息

帮助 ...	对话框	又见
概述

GPS 处理类型可以使用户自己定义所需的特殊要求的处理方式，例如：使用精密星历或一个特殊的高程坐标系。设置可以由用户命名的类型保存起来以便今后通过指定类型的名称直接调用它。用户可以建立一个处理类型库用于处理某一通用的类型。

最普通的控制可以从GPS处理类型对话框直接获得。另外的高级控制也可获得以便用于察看和编辑。这些高级处理控制集中在一个对话框中并通过标签分别列出。

下列这些标签是可用的：

  静态

  动态

  全球

  性质

  对流层

  Ion电离层o

  事件

  OTF搜寻


GPS数据源 - 概览
    GPS数据源 - 概述

更多的信息

 又见

概述

基线处理器使用GPS接收机制定的测量规范计算基线。这些测量规范保存在，或者参考：

  Trimble数据采集器  (*.dc)

  Trimble接收机  (*.dat)

  其他厂商的接收机  (RINEX)

除了GPS测量规范，这些数据源也能提供用于确定如何处理GPS测量规范的信息，例如，当接收机固定在一点时，或者接收机移动时。这点允许基线处理器根据以下的不同确定GPS测量规范的类别：

  静态/快速静态GPS数据

  动态数据

  流动和连续的动态数据


GPS处理类型 - 概览
    GPS处理类型 - 概述

更多的信息

帮助 ...	对话框	又见
概述

GPS处理类型允许用户定制自己特殊的处理需要，例如利用精密星历处理或一个特殊的高程系统。用户可以给此设置类型命名并可以以后通过指定类型的名字调用它。这也允许建立一个处理类型库以便处理某一特殊通用的处理过程。GPS处理类型是系统的增强。新的类型或对原有类型的改变都可用于单微机上所有的项目。

GPS处理类型对话框是类型的控制中心。当前所选的类型称为激活的类型。激活的类型用来提供项目中用于并行的处理时段的基线处理器的控制。不同的项目可以有不同的激活的类型，同时，激活的类型可以在不同的基线处理时段间改变。GPS处理类型对话框也能提供编辑、拷贝、重命名和删除类型的功能。

Trimble Geomatics Office软件使用Trimble默认的GPS处理类型。对于大多数测量应用，用户不需要定义这个类型。如果用户定制了新的控制，则只有在用户知道这些改动将产生的影响后在保存这些变更。

为了获得更多的信息，请参见编辑类型 。


GPS基线处理 - 概览
    GPS基线处理 - 概述

更多的信息

 又见

概述

如果安装了基线处理器模块，Trimble Geomatics Office软件就可以产生后处理基线解。基线处理器模块包括 WAVE�，加权模糊度向量估计。此程序利用由静态、快速静态或动态数据数据采集程序获得的GPS野外观测值计算基线解。基线处理器使用载波相位和编码观测值计算测量点之间的三维GPS基线。

在Trimble Geomatics Office 软件中，后处理方法是简单易懂得。基线处理器配置了满足大多数测量项目需要的系统默认的配置。后处理方法的控制也能更改并以GPS处理类型名字保存，以满足高级处理和重处理的需要。

对于使用不同测量技术采集的数据，单独的处理时段不做要求。基线处理器先检查要处理的数据，然后自动地决定处理方法。静态、快速静态和动态测量可以同时处理，如果需要，还可以加入一些高级控制。


    确定潜在的基线

更多的信息

 又见

一旦用户导入两台同时交迭的接收机采集的GPS测量数据，一条潜在的基线就会在图形窗口出现。同时交迭的数量必须达到解算的最少数量。潜在的基线可以但还没有被基线处理器解算。

Trimble Geomatics Office 软件可以自动地确定潜在的基线。只要GPS测量数据导入一个项目，软件就会搜寻可以解算的其余的交迭的数据。只要在两套数据间同时重叠满足或超出激活的GPS解算类型所规定的最小值，或者，只要一个观测标识符存在于动态数据设置中，一条潜在的基线就会加入到项目中。

注：如果用户在将数据导入到Trimble Geomatics Office软件前从GPS基准站下载几个小时的数据时段，请使用Rinmerg应用程序将数据联合到一个文件。


    选择解算的基线

更多的信息

 又见

当选择了Survey / Process GPS Baselines，缺省的，所有潜在的基线都将解算。只要它们都加入到了项目，解算全部潜在的GPS基线就不需要额外的步骤和选项。

同时，在选Survey / Process GPS Baselines之前，可以选定一条或多条基线进行解算或重解算。当选定一条或多条基线时，则考虑选择的设置。

利用任何标准的方法做出选择

  在图形窗口单击一条或多条基线

  由询问选择

  以前选择的设置

注：如果用户定义的选项设置没有包括GPS基线或动态基准，基线处理器将显示一条信息指出没有选择基线，在项目中没有解算所有的潜在基线。如果这种情况出现，在图形窗口中单击图上空白区域重新启动基线处理器。View Filters选项将有助于确定解算或重解算向量的子集。

如果项目中包含有连续的动态数据，缺省的，所有没有处理的动态基准都将被处理。由一个特定的基准处理连续的动态数据，选择基准对应的点开始处理。

连续的解算基线。基线的一个测站作为基准站，另一个作为流动站，它的方向由处理器自动地确定。为了转换精确的坐标，方向进行了优化处理。从一点到另一点的精确的控制坐标的转换涉及到起算的坐标。基线处理器自动地选择解算过程中质量最高的点作为坐标起算点，基线利用这些点解算出来。

在大多数情况下，处理器将选择恰当的方向进行解算，特殊地，在设置控制和野外观测时段时已考虑到。然而，在一些情况下，用户可能需要通过交换基准站和流动站转换基线方向。为了转换解算后的基线方向，先在图形窗口种选择图上的基线，然后选择Edit / Reverse Observation Flowout。

基线的方向也能用于特殊方向上的强迫解算。基线上的箭头指出的方向。如果需要，反向来强迫解算所需方向上的基线 。

注：如果用户在将数据导入到Trimble Geomatics Office软件前从GPS基准站下载几个小时的数据时段，请使用Rinmerg应用程序将数据联合到一个文件。


    选择GPS处理类型

更多的信息

帮助 ...	对话框
GPS处理类型允许用户定制自己特殊的处理需要，例如利用精密星历处理或一个特殊的高程系统。用户可以给此设置类型命名并保存，以后通过指定类型的名字调用它。这也允许建立一个处理类型库以便处理某一特殊通用的处理过程。GPS处理类型是系统的增强。新的类型或对原有类型的改变都可用于单微机上所有的项目。

GPS处理类型对话框是类型的控制中心。当前所选的类型称为激活的类型。激活的类型用来提供项目中用于并行的处理时段的基线处理器的控制。从类型列表中选择一种类型作为项目的当前激活的类型。

不同的项目可以有不同的激活类型，同时，激活的类型可以在不同的基线处理时段间改变。GPS处理类型对话框也能提供编辑、拷贝、重命名和删除类型的功能。

Trimble Geomatics Office软件使用Trimble默认的GPS处理类型。对于大多数测量应用，用户不需要定义这个类型。如果用户定制了新的控制，则只有当用户知道这些改动将产生的影响后再保存这些变更。


    何时使用GPS基线处理器

更多的信息

 又见

大多数测量员在野外观测之后立即处理测量数据已确定是否有基线需要重新观测。

在使用基线处理器之前，做下列事情：

  生成项目

  设计野外观测资料（推荐）

  在野外采集数据

  从接收机下载数据，测量设备或者项目中Trimble Geomatics Office软件使用的计算机

通常，基线解算并不是GPS测量项目中最后一步。解算出的结果将全面反映GPS测量的质量，但是好的测量习惯应该包括全部观测的网平差。网平差将有助于确定网内部的观测基线的稳固性，同时生成 最终坐标。参见Trimble Geomatics Office软件网平差帮助。


GPS基线处理命令 - 概览
     GPS基线处理命令 - 概述

更多的信息

 又见

概述

GPS基线处理命令可用在测量和报表菜单中

这些测量菜单命令是可用的：

  GPS处理类型

  GPS处理

报表菜单有如下命令可用：

  GPS基线处理报表

  GPS基线处理报表设置

视图菜单有如下命令可用：

  时间线

  计划区 (Toolbars)

  时间线 (Toolbars)

这些测量视窗命令在处理GPS基线前后都是有用的：

  GPS闭合环报表

  重新计算

  重新计算报表

  时间线


解算GPS基线 - 概览
    解算GPS基线 - 概述

基线处理器利用由静态、快速静态或动态数据采集程序采集的GPS野外观测值计算基线解。基线处理器使用载波相位和编码观测值计算测量点之间的三维GPS基线

处理GPS数据还需考虑很多事项。为了获得更多有关GPS基线解算的信息，参见下列主题：

  确定潜在的基线

  选择需要处理的基线

  选择GPS处理类型

  开始基线解算

  查看处理结果

  保存处理结果

  重新解算基线


    开始使用GPS基线处理器

更多的信息

帮助 ...	对话框	又见
仅当用户工作在测量视窗并且已经导入了两个或更多的GPS测量到项目中，基线处理器才可使用。

解算所有潜在的基线

解算所有潜在的基线：

1.	打开一个包括一条或多条潜在基线的项目。

2.	启动处理器，做下列之一：

  从测量菜单，选择解算GPS基线。

  从项目栏的Trimble Survey Group中选择解算GPS基线。

  从项目栏的Process Group中选择解算GPS基线。

  按F9。

GPS处理对话框出现，基线处理器开始解算所有潜在的基线。

解算一条或多条所选的基线

解算或重解算一条或多条所选的基线：

1.	打开一个包括一条或多条潜在或已保存的基线的项目。

2.	使用任何标准的选择方法生成一个基线处理选择集，做下列之一：

  在图形窗口中单击一条或多条基线。

  按顺序选择

  以前的选择设置

3.	图形窗口中被选的基线以粗线标出。

4.	启动处理器，做下列之一：

  从测量菜单选择解算GPS基线

  从项目栏的Trimble Survey Group中选择解算GPS基线。

  从项目栏的Process Group中选择解算GPS基线。

  按 F9.

GPS处理对话框出现，基线处理器开始解算所有选择的基线。

解算连续的动态基线

解算连续的动态基线

1.	打开一个包括连续动态数据的项目。

2.	选择测量过程中安置基准站接收机的点。

3.	启动处理器，做下列之一：

  从测量菜单选择解算GPS基线。

  从项目栏的Trimble Survey Group中选择解算GPS基线。

  从项目栏的Process Group中选择解算GPS基线。

  按 F9.

GPS处理对话框出现，基线处理器开始解算动态的基线。

解算特殊设置的动态基线

解算特殊设置的连续的动态基线：

1.	打开一个包括连续动态数据的项目。

2.	查看时间线，做下列之一：

  选择视窗/时间线。

  按 Alt+VI.

时间线视窗区显示。

3.	选择测量的基准站接收机观测。

4.	启动处理器，做下列之一：

  从测量菜单选择解算GPS基线。

  从项目栏的Trimble Survey Group中选择解算GPS基线。

  从项目栏的Process Group中选择解算GPS基线。

  按F9.

GPS处理对话框出现，基线处理器开始解算动态的基线。

监控GPS解算对话框的状态栏

位于GPS处理对话框底部的状态栏显示了每一个正在处理的文件的进度。解算过程中显示每一条基线的起始测站名。一条基线解算完后，GPS处理列表显示出处理结果的概述。基线处理器接着执行处理下一条基线。状态栏不断更新显示每一条基线当前状态。它还基于当前激活的GPS解算类型规定的缺省接收标准设置显示接收(Acc)和拒绝(Rej)的基线数。

为了更多有关基线解算对话的信息，请参见基线解算日志 。


    查看处理结果

更多的信息

帮助 ...	对话框	又见
GPS处理对话框当解算基线时会自动显示。位于这个对话框底部的状态栏显示出每一个文件装载时的进度，解算过程中显示每一条基线的起始测站名。一条基线解算完后，GPS处理列表显示出处理结果的概述。基线处理器接着执行处理下一条基线。状态栏不断更新显示每一条基线当前状态。它还基于当前激活的GPS解算类型规定的缺省接收标准设置显示接收(Acc)和拒绝(Rej)的基线数。

为了更多的信息，参见下列主题：

  使用GPS处理对话框

  使用GPS基线处理报表


    使用GPS处理对话框

更多的信息

帮助 ...	对话框	又见
GPS处理对话框显示：

  处理状态

  解算基线的数目

  接收和拒绝的基线数目

  表格形式的单行概述处理结果

  解算完的基线的中间状态

GPS处理对话框还提供下列功能：

  保存基线解算结果到项目

  生成一个GPS基线解算报表

  控制重新解算的基线如何保存

这些控制是可用的：

处理列表

观察这个列表可以监控GPS解算过程中的结果。为了获得列表栏更多的信息，参见GPS处理列表。

GPS处理状态指示器

GPS处理指示器显示在状态栏上。单击这个指示器，GPS处理对话框重新居中。

显示在状态栏左边的进度指示器监控着每一条基线解算的进度。

第二个指示器显示由GPS处理器生成的信息。个别的基线在处理过程中显示出起点和终点。

在状态栏右边的第三个指示器显示出处理的文件个数和剩余的需要处理的基线个数。这个指示器工作在全部基线处理完和单击保存将结果保存到项目中。

最右边的状态指示器总结了接收和拒绝基线的数目。

停止/保存

处理完成之前，用户可以单击停止中断进一步的解算而没有取消这条基线解算过程。解算完成之后，停止按钮变为保存按钮。选择保存将在GPS处理列表所选的结果保存到项目中去。在使用对话框中通过一个检核标志显示所选的基线解。如下所述，保存操作也受到覆盖原有的基线解检核对话框的影响。

取消

选择这个选项可在GPS解算开始后任何时候中断GPS解算过程。

  如果单击这个按钮时GPS处理已经完成，就会弹出一条确认信息。如果用户单击是，处理的结果就会被删除同时对话框关闭。如果用户单击否，就转回到GPS处理对话框。

  如果GPS处理过程中，按钮被按下，处理在完成当前基线解算后停止，同时弹出一条确认信息。如果用户单击是，处理的结果就会被删除同时对话框关闭。如果用户单击否，就转回到GPS处理对话框。

报表

选择这个按钮查看选定的基线解的GPS基线解算报表。只有从GPS处理列表中选择了一个基线解，按钮才能使用。

覆盖已有的基线解

此选项控制重新处理的基线如何保存。缺省的，检核对话框被清除，新的解添加到项目中，原有的解仍然保留。在这种情况下，新的解变为激活的解，原有的解变为不被激活的。属性窗口可以将以前的解变回为激活的解。

覆盖原有基线解选项仅用于处理多于一次的基线。它并不影响相同两点间的由不同时间或不同天采集的数据计算的基线。Trimble 建议覆盖原有的基线解。


    使用GPS基线解算报表

更多的信息

帮助 ...	对话框	又见
GPS基线解算报表给出了基线解的详细信息。

生成一个GPS处理报表，做下列之一：

  在GPS处理对话框中双击一条基线。

  在GPS处理对话框中选择一条基线，单击报表。

  在图形窗口选择一条基线同时选择报表/GPS基线解算报表

GPS基线解算报表可用于：

  检查在单行概述中不可用的基线解的详细内容，例如，在NEU中的错误或使用的测量的数目和拒绝的数目。

  利用用户的野外观测记录更改测站信息。特别注意的是：

  测站名

  天线高，类型和测量方法

  起始时间

  检查每一个测站的卫星相位跟踪概述，在L1或L2信号中检查中断或间隔

  检查组合的卫星相位跟踪概述。灰色的底纹显示基线解算中实际使用的测量。

  检查每一颗卫星的残余区域。这些表示每一颗用于确定基线解的卫星的RMS。


    保存处理结果

更多的信息

对话框	又见
在GPS处理对话框中单击保存将在GPS处理列表中所选的基线解保存到项目中。通过使用对话框的检查标志显示所选的基线。

如果处理过程包括了重新解算的基线，保存将受到覆盖原有基线解检核对话框的影响。此选项控制重新解算的基线如何保存。缺省的，检核对话框被选择，意味着覆盖已存在的解。如果检核对话框被清除，新的解将添加到项目中同时原有的解保持不变。在这种情况下，新的解变为激活的解，原有的解变为不被激活的。属性窗口可以将原有的解变回为激活的解。

覆盖原有基线解选项仅用于处理多于一次的基线。它并不影响相同两点间的由不同时间或不同天采集的数据计算的基线。Trimble 建议覆盖原有的基线解。


     L1固定

 概述和更多信息

对于长度只有几公里的短基线，当使用双频数据解算时，一个L1通过取代无电离层影响固定而生成。然而，最终的L1解利用双频数据生成已用来获取L1模糊度。对于大约5公里甚至更短的基线，通常L1固定解是最优解，因为解中含有得更少的噪声。

通过使用GPS处理类型 设置L1解的开关值。


    无电离层影响固定

 概述和更多信息

无电离层影响固定解是最宽松条件下的最优解。这些解中无电离层偏移，固定模糊度提供了全部的最优解。

对于短基线，无电离层影响固定解是较差的解。对于短基线避免使用此解。Trimble Geomatics Office软件能够自动的识别短基线并且选择适当的最终解的类型。

参见L1固定获得更多的信息。


    L1 浮动

 概述和更多信息

当处理单频数据时，如果L1模糊度可以成功确定，基线处理器就产生一个L1固定最终解。如果L1搜索不成功，就产生一个L1浮动解。短基线的L1浮动解起因于过短的观测和观测值中异常的噪声。对于10到15公里甚至更长的基线，由于单频观测对电离层延迟的敏感性，获取可靠的L1固定解变得更加困难。

L1浮动解一般情况下比固定整周数解精度差。对于正规的测量应用，Trimble不推荐用户使用L1浮动解。用户应该重新处理数据或重新观测这些基线。

是否生成固定整周数解是由基线处理器内部定义的开关比率值控制的。处理器在内部设置开关值为1.5。如果计算的比率值小于此开关值，就生成浮动解。


    无电离层影响浮动解

 概述和更多信息

对于长于30公里的基线，无电离层影响浮动解可能是最好的解，但是一定要检核它。对于非常长的基线，无电离层影响浮动解时可能获得的最好解。长时间的观测会得到更好的无电离层影响浮动解，因为没有电离层偏移的观测能使解向改正的几何解靠近。事实上，对于观测几个小时的非常长的基线，无电离层影响浮动解是最优的解。

对于非常长的基线（几百到几千公里），使用双频数据选择浮动解类型产生无电离层影响浮动解。如上所述，对于观测几个小时的非常长的基线，无电离层影响浮动解是最优的解。

对于非常长的基线的浮动解的开关值可以使用GPS处理类型设置。单独的标准可以为广播星历和精密星历的使用设置。


GPS处理数据分析 - 概览
    GPS处理数据分析 - 概述

更多的信息

帮助 ...	对话框	又见
概述

评价测量的质量是一项重要的工作。由于测量技术本身（从卫星采集载波数据）不如使用传统的测量技术测量距离或角度那么直观，用户必须依赖于事后处理工具评价结果。下面有一些简单的帮助，如果使用认真，会获得更好的GPS测量结果。

如果基线处理的结果没有期望的好，在用户必须到野外重测有问题的基线之前，有几项选择可以改善结果。GPS基线解算报表中的信息可以帮助确定卫星信号的冲突，从而分离出卫星信号有问题的那一段观测时间。如果用户决定使用不同的GPS处理类型重新处理数据，此报表是有用的。

潜在的问题

质量差的GPS处理结果可能由下列问题引起，包括：

  野外工作失误，例如：

 错误的测量天线高

 错误的测站名

 对中误差

  矛盾的接收机设置，例如：

  同步率

  SVs开启或禁用

  数据格式

  最低要求的数据采集，例如：

  观测的卫星数目太少

  太高的PDOP值

  太多的卫星低于高度角

  多路径效应

  太多的周跳

  太短的观测时间

第一类潜在的误差是操作错误或粗差。用户可以通过严密的野外观测程序减少粗差。以英尺和米测量记录天线高，并且要在观测开始和结束分别记录两次，有助于消除测量误差。使用固定高的三角架减少读尺误差，避免移数误差。野外记录的测站名，位置，观测时间和天线高要清楚、准确，当处理数据时，这些对于问题的解决非常有帮助。

第二类潜在的误差很难去除。理想上的GPS测量总是有6颗以上的卫星，好的PDOP值，没有树并且通视。然而，这种情况是不切实际的期望。因此，必须采用经野外证实的考虑了野外真实情况的方法。

改善质量

用户可以通过做以下的步骤最大限度的改进GPS测量结果的准确度。考虑以下的帮助：

  尽可能选择最好的条件，对工作进行强制。使用快速规划选择最好PDOP值的周期和足够的卫星数目。为了获得垂直方向上好的结果，同时检查VDOP值。

  在观测之前查看测站地区是否不通视和由多路径来源的可能性，（如果可能）重新部署完全不通视的测站。这对于动态测量中的基准站非常重要。

  调整同一测量时段使用的全部接收机的设置，使之协调。

  假定条件允许，观测时间要足够长。如果用户不太确定，就增加观测时间直到用户对动态测量有足够经验，特别注意的是初始化，对于静态初始化或on-the-fly初始化要增加观测时间。如果用户减少观测时间，就有更大的可能性必须重新观测基线。

  使用好的测量习惯，进行多余观测。在独立时段中，关键的基线要观测两次。设计网时，所有的测站至少有三条独立基线与它们相连。这样的话，即使不能计算任何一条基线，用户仍然可以计算测站坐标而不需返回野外重测。

  设计网在两个甚至更多时段观测的基线形成小的闭合环，确保闭合环更有用。如果一个环中所有的基线时在同一时段观测，对于在那个时段观测的所有基线的测站设置误差不能探测到。

  了解如何评价基线处理器输出的结果。一些简单的帮助将有助于用户探测和评价结果(有关处理结果的评价在下面讨论)。

  使用网平差模块（如果安装了）。用户并不知道是否工作已作，直到项目中所有的基线都同时在一起进行平差。严格的网平差是探测网中是否有粗差和系统差的最强大的工具。

以上所列的步骤，以及Trimble Geomatics Office软件提供的工具，例如，重计算，闭合环和可选择的网平差模块，所有这些帮助确保网适合用户项目的特殊需要。

下列主题给出另外的可用于处理，检核和改善GPS数据质量的帮助：

  GPS基线解算报表

  重新解算有问题的基线

  使用时间线检查数据

  改正周跳

  改正不可用的测量数据

  禁用GPS观测资料

  禁用所选的卫星


    多路径效应

 概述和更多信息

由于信号在多种表面的反射导致的多路径效应增加了GPS卫星信号传播的时间。通常多路径效应的来源包括：

  水面

  建筑物

  车辆

  栅栏

特别的，城市地区更能引起多路径效应。

剩余的区域以正弦波显示多路径。正弦波的大小取决于卫星信号的强度和多路径产生源与接收机的天线相位中心的距离。对于小于15分钟的数据识别多路径效应是困难的。如果用户怀疑某一地区有多路径效应，设计更长的观测时间以便基线处理器有足够的数据消除多路径效应。使用带有圆盘的天线，或闭合环天线将有助于减少这些影响。


     重新解算基线

更多的信息

帮助 ...	又见
执行下列步骤重新解算基线 ：

1.	选择重新解算使用的激活的GPS处理类型

2.	使用任何标准的选择方法产生重新解算基线的选择集，做下列之一：

  在图形窗口单击一条或多条基线。

  按顺序选择。

  以前的选择集。

3.	开始重新处理，做下列之一：

  从测量菜单选择处理GPS基线。

  从项目栏的Trimble Survey Group选择处理GPS基线。

  从项目栏的Process Group选择处理GPS基线。

GPS处理对话框显示，基线处理器开始重新解算所有所选的基线。使用GPS处理列表评估处理的结果来决定是否保留或舍弃新的结果。在保存新的结果到项目中之前检查覆盖原有基线解检核对话框的状态。

覆盖原有基线解检核对话框控制重新处理的基线如何保存。缺省的，检核对话框被选择，意味着覆盖已存在的解。如果检核对话框被清除，新的解将添加到项目中同时原有的解保持不变。在这种情况下，新的解变为激活的解，原有的解变为不被激活的。属性窗口可以将原有的解变回为激活的解。

覆盖原有基线解选项仅用于处理多于一次的基线。它并不影响相同两点间的由不同时间或不同天采集的数据计算的基线。Trimble 建议覆盖原有的基线解。


    周跳

 概述和更多信息

周跳是连续的跟踪卫星中间的间段。在连续的跟踪过程中，接收机通过收到的波的前端的个数进行周数统计。因此，当接收机由于卫星跟踪过程中的中断而丢失计数，就会产生周跳。因此，周跳连续的载波相位重置。如果基线处理器通过计算可以重新恢复计数，周跳并不是一个严重问题。

中断卫星信号的原因有很多，包括固定和移动。当固定时，卫星状况差，高度角低，或者由于障碍物挡住信号，例如大树。移动时就有更多的原因引起周跳：从大桥下通过，穿过一条隧道，驾驶或走在树下或仅仅由于用户的手挡住天线。找到引起周跳的原因，尽可能的避免周跳发生。


    GPS基线处理报告 - 处理概述

GPS基线处理报告部分快速确定成功处理的基线，和需要进一步研究的基线。

利用下述方法访问处理概述：

  在GPS处理对话框中双击一条基线解的概述。

  选择一条或更多基线，在GPS处理对话框中单击报告。

  在图形窗口中，选择基线，然后选择报告/ GPS基线处理报告。

显示下列信息：

列	显示内容
ID	基线标识符
起	进行GPS观测的起点测站名称。
始	进行GPS观测的终点测站名称。
基线长	起始测站间的基线长
解类型	解类型。通常大多数报告类型为短基线的L1固定解，和中间基线的无电离层影响的固定解。如果处理很长的基线，可使用无电离层影响的浮动解。
比值	基线处理器比较具有最小方差的两个解。比值为次最佳解的方差比最佳解的方差。 注：仅仅固定解有比值。
参考方差	参考方差是表示观测数据如何适合基线解的一个无单位的量。
RMS	RMS（均方根误差）。RMS表示单独基于卫星距离修正观测值的测量噪声的解的质量。它是独立的卫星几何位置。


GPS基线处理报告 - 基线概述

GPS基线处理报告部分显示指定基线的概述信息。调查该基线：

1.	选择报告/ GPS基线处理报告。显示基线处理报告。

2.	从处理概述中选择基线。

显示下列信息：

区域	显示内容
处理	计算解时显示天，日期，和时间。
解类型	通常大多数报告类型为短基线的L1固定解，和中间基线的无电离层影响的固定解。如果处理很长的基线，可使用无电离层影响的浮动解。
解的可接受性	解是否通过设置在GPS处理类型对话框中的接受标准。
使用星历	确定基线解时是使用广播星历还是精密星历。
气象数据	使用气象模型。
基线斜距	基线的斜距。
高度截止角	处理期间设置高度截止角。该值设置在GPS处理类型对话框中。
方差比	基线处理器比较具有最小方差的两个解。比值为次最佳解的方差比最佳解的方差。 注：仅仅固定解有比值。
参考方差	参考方差是表示观测数据如何适合基线解的一个无单位的量。
RMS	RMS（均方根误差）。RMS表示单独基于卫星距离修正观测值的测量噪声的解的质量。它是独立的卫星几何位置。
平面精度	观测值的平面精度。
垂直精度	观测值的垂直精度。
开始时间(GPS时间)	GPS 观测值的开始时间。
结束时间(GPS时间)	GPS 观测值的结束时间。
观测时间	观测时间的长度，即，GPS 观测值的开始时间和结束时间之差。


GPS基线处理报告 - 基线成分

GPS基线处理报告部分显示观测期间观测的两点的坐标。也显示两点之间的基线分量，标准误差，和后验斜方差矩阵。

访问基线成分部分：

1.	选择报告\ GPS基线处理报告。显示GPS基线处理报告。

2.	从处理概述中选择基线。显示基线概述。

3.	从内容中选择基线成分。

显示每个点的坐标，即格网，当地的，和WGS-84坐标。

在基线成分表中显示下列区域：

  北方向，东方向，和高程增量

  方位角分量

  椭球距离

  高程增量

  X，Y，Z的增量

在标准误差表中显示下列区域：

  σ北方向，σ东方向，σ高程

  σ方位角分量

  σ椭球距离

  σ高程增量

  σX, σY, σZ

在后验协方差矩阵表中显示协方差信息。


GPS基线处理报告 - 观测

基线处理报告部分显示测量中用于观测点的GPS接收机和天线的详细资料。

访问观测部分：

1.	选择报告\GPS基线处理报告。显示GPS基线处理报告。

2.	从处理概述中选择基线。显示基线概述。

3. 	从内容中选择观测。

显示下列信息：

区域	显示内容
点名	GPS接收机观测点的名称。
数据文件	在起始点中文件名(.dat文件)用于存储数据。
接收机类型	用于测量的GPS接收机类型。
接收机的序列号	GPS接收机的序列号。
天线类型	GPS天线的类型。
测量到	确定天线高时测量到GPS天线上的点。
天线高	测得的GPS天线高和到天线相位中心的天线高(APC)。 .注：APC值根据天线类型来计算。
天线模型	GPS天线的模型。


GPS处理报告 - 处理类型

基线处理报告部分概述了用于处理的控制。这些控制设置在GPS处理类型对话框中。必须确保用于GPS基线处理中的设置正确。

访问处理类型部分：

1.	选择报告/GPS基线处理报告。显示GPS基线处理报告。

2.	从处理概述中选择基线。显示基线概述。

3.	从内容中选择处理类型。

显示下列区域：

部分	区域
处理类型 −显示使用的处理类型名称。	高度截止角 星历类型 解类型
静态 −显示静态处理器控制。	最小基线观测时间 尽量固定一个解的最大基线长度-显示两种设置；一种用于广播星历另一种用于精密星历。
动态 −显示动态处理器控制	最小参考观测时间 最小静态初始化观测时间 最小已知点初始化比值 最小OTF处理时间
全球 −显示全球设置标签中的全球设置。	频率类型 最大固定周期（仅限静态处理） 最大重复（仅限静态处理） 最大整周搜索时间（仅限静态处理）
质量	RMS接受标准 比值接受标准 参考方差接受标准 编辑乘法器
对流层	模型 最小天顶延迟时间间隔 使用观测的气象数据
电离层	模糊度解通过（仅限静态处理） 最终通过
事件	添写类型 符合的点数 最大容许缺少历元 时间差 注：在属性窗口中查看事件数据。
OTF搜索 �显示用于On-The-Fly搜索的方法。


    GPS基线处理报告 - 跟踪概述

基线处理报告包括每个点的跟踪概述，和一个组合的跟踪概述。

访问跟踪概述部分：

1.	选择报告\GPS基线处理报告。显示GPS基线处理报告。

2.	从处理概述中选择基线。显示基线概述。

3. 	从内容中选择跟踪概述。

单独的点概述

这些概述显示接收到的每颗卫星的L1 和L2 信号的跟踪质量。

卫星跟踪概述显示基准站和流动站卫星跟踪的连续性。概述通过在每个测站利用每颗卫星固定的，连续的基线显示整个观测时段的连续跟踪。

使用概述确定发生周跳（失锁）的大小和个数。数据中的差距和突变显示卫星的周跳。发生周跳后，当接收机再次接收卫星信号时，标记记号。

组合概述

因为基线处理需要在同一测站同时跟踪相同的卫星，GPS基线处理报告也包括组合跟踪。

用于处理的部分作为围绕信号的暗盒显示。在处理阶段部分，差距表示基线处理器不使用这部分数据来处理基线。


    GPS基线处理报告 - 连续动态质量

更多信息

帮助 ...	报告	又见

仅仅在处理连续动态数据之后才包括这部分。连续动态质量部分包括两部分。

访问连续动态质量信息：

1.	选择报告\GPS基线处理报告。显示GPS基线处理报告。

2.	从处理概述中选择基线。显示基线概述。

3.	从内容中选择连续动态质量。

首先是根据时间画出的每条连续动态基线的RMS区域。当出现不好的结果时，它能用于识别时间。在时间上对RMS增加一个常数也能显示处理过程中可能出现的问题。

第二是根据时间获得的RDOP 部分和SV的个数。当卫星几何位置不好导致处理结果不好时，该部分用于识别时间。


    GPS基线处理报告 - 残差

残差部分是对用于基线解算的每颗卫星的残差观测值的几何表示。

残差部分显示从每颗卫星接收到的数据的质量。利用该部分来求解中噪声的数量。该部分显示每个测量周期每颗卫星的残差量。卫星噪声可能影响来自其它卫星的数据。图表中的线应绕零点居中。解中噪声的数量显示了相对于零点的距离。

处理器不显示所选择的作为基准进行双差解算的卫星的残差量。对于长时间的观测，为了得到这个目的，处理器可选择多颗卫星。残差部分的差距意味着对于那段时间卫星作为基准进行双差计算来使用。


    对于无电离层影响的L1解

无电离层影响的固定解是在最宽范围条件下的最佳解。这些解包含电离层偏移，和对于整个解的固定的模糊度。

但是，短基线的无电离层影响的解可能是一个不固定的解。避免使用在短基线中使用这样的解。Trimble Geomatics Office软件自动识别短基线和选择适当的最终解类型。

大于30公里的基线的无电离层影响的浮动解可能是一个很好的解，但是必须确定对它的检验。对于非常长的基线，无电离层影响的浮动解或许是所能获得的最好解。较长的观测时间可以产生更好的无电离层影响的浮动解，因为无偏离无电离层影响的观测使得结果更接近于正确的几何结果。事实上，对于长基线的无电离层影响的浮动解，如果观测几小时，可以给出极好的解。

对于很短的基线（小于5公里），典型的L1最终通过（从双频模糊中分离的）是最终的解；对于非常长的基线（超过200公里使用广播星历，2000公里使用精密星历），无电离层影响的最终通过或许是最终解，如下：

很短的基线

对于长度只有几公里的短基线，L1最终通过就代替无电离层影响的固定解而产生。然而，此最终的L1解通过使用双频数据获取L1模糊度而产生。对于大约5公里或更短的基线，L1固定解通常会更好，因为结果中含有更少的噪声。

对于L1解，可以通过使用GPS处理类型设置用作关闭的值。

非常长基线

对于非常长的基线（几百公里到几千公里），通过使用双频数据选择一个浮动解类型可以产生无电离层影响的浮动解。正如前面所提到的，对于非常长基线，长时间的观测可以给出极好的无电离层影响的浮动解。

对于非常长的基线的浮动解，可以通过使用GPS处理类型设置用作关闭的值。单独的标准可以设置以用于广播星历和精密星历


    浮动解

更多信息

帮助 ...	报告	又见

当处理单频数据时，如果L1模 糊度能够成功地确定，基线处理就产生L1固定最终通过解。但是，如果L1搜寻未成功，就产生L1浮动解。对于很短的基线，如果观测时间过短或观测值有异常的噪声，就产生L1浮动解。对于10至15公里甚至更长的基线，由于单频观测值对于电离层延迟的敏感性，获得可靠的L1固定解变得愈加困难。

通常L1浮动解比固定整周解差。对于正规的测量应用，推荐避免使用L1浮动解。应该重新处理数据或在野外重新观测这些基线。

产生固定整周解是由基线处理内部定义的关闭比率控制的。关闭设置为1.5。当计算的比率低于关闭比率时，就产生浮动解。


    GPS基线解算报表设置对话框

更多信息

帮助 ...	又见

使用这个对话框选择出现在GPS基线处理报告中的部分。

访问它，作下列之一

  选择报告/设置/GPS基线处理报告

  单击Alt+RSO

GPS基线处理报告设置对话框出现。

选择或取消核对按钮，它可以添加或删除下列的报告部分

  基线概述

  基线分量

  观测

  处理类型

  联合跟踪概述

  连续动态质量

  残差


        Trimble数据采集器(*.dc)

这些文件典型地包含实时动态(RTK)或常规测量所获得的信息。当不能进行无线电通信时，Trimble数据采集文件通常参考用于后处理的GPS观测值。在这种情况下，点信息存储在数据采集文件中，原始GPS观测值存储在用于后处理的相关.dat文件中。在Trimble Geomatics Office软件中，基线处理器使用数据采集文件所参考的GPS观测值来计算实时中不能解的基线。

虽然GPS观测值存储在单独的.dat文件中，输入程序能自动装载它们，因为参考它自身的数据采集文件。它们不必作为单独的文件装载。

数据采集文件包括多个测量时段，使用不同测量方法所采集的观测值。


    Trimble接收机(*.dat)

这些文件包含Trimble GPS接收机采集的观测值。这些文件典型地记录在接收机内存板中，或Trimble数据采集的内存卡中。这些文件从测量装置中下载到用于处理的Trimble Geomatics Office软件中。处理器利用静态，快速静态和动态技术使用包含在文件中的观测值计算基线 。


    其它接收机生产商(RINEX)

更多信息

 又见

这些文件包含GPS接收机采集的观测值。在内容上它们是相似的.dat文件，但存储在接收机独立转换格式(RINEX)中。RINEX格式是代表接收机采集的GPS数据的ASCII。RINEX文件包括观测值，导航电文，和？？数据。

RINEX文件从基准站获得，例如IGS跟踪网，美国连续运转的参考站(CORS)，或其它厂商软件。处理器使用这些文件正如使用.dat文件获得矢量基线解。


    静态/快速静态GPS数据

更多信息

 又见

下列区别存在于静态 测量时段和快速静态 测量时段期间所采集的数据之间。

对于静态时段，假定接收机：

  保持固定于单个点上

  较快速静态长的时间采集数据。

对于快速静态时段，假定接收机：

  移动到几个点并且在每个点上采集数据时保持固定，以及

  当接收机从一个点移动到另一个点时不采集数据，并且

  较静态时段短的时间采集数据

静态和快速静态最重要的区别在于接收机记录数据需要的最少时间（观测时间）。这个时间取决于应用软件，基线长，和是否使用单频或双频接收机。

静态观测时间从30分钟到几个小时或更长用于需要高精度和可重复测量。使用双频接收机，快速静态观测时间大约8分钟，但也可能更长，这基于当地条件。

通常，较长基线需要较长观测时间。随着观测时间的增加，计算结果的可信性也提高。需要在测站保持的时间取决于卫星星座。观测时间随着可见卫星数的增加而减少。观测时间也取决于观测的基线长度。通常，较长基线需要较长观测时间，不顾及卫星星座。

静态和快速静态测量方式提供了可能的最高GPS精度。当提前计划使用结合另一时段的静态或快速静态数据采集时段时，通常获得最佳结果。


    动态数据

更多信息

 又见

动态测量时段和静态或快速静态时段的区别在于进行数据采集时接收机是可移动的或流动的；采集动态数据时，接收机通常不保持固定。

动态和静态/快速静态测量方式的另一重要区别在于观测时间。在动态测量中，测站观测时间明显缩短（初始化后）。它能从几分钟减少到几秒钟，取决于应用。这允许进行高产测量；能在短时期内采集多个数据点。

但是，提高生产力有一个缺点：可得到的精度低于使用静态/快速静态方式所获得的精度，较短的观测时间产生更多的多路径，因为数据较少。联合动态测量的精度限制用于不需要高精度的GPS应用中。

当获得锁定的卫星时，动态测量需要一个初始化步骤解决GPS信号中未知的整周模糊度 。必须解出模糊度用于处理期间获得需用于测量的高精度的解。

一旦进行初始化，能在测量点上使用短的观测时间。Trimble Geomatics Office软件将初始化用于随后的解。因此，一旦进行初始化，仅需要一个具有足够数据的观测时间获取新的位置。

初始化的四种类型存在于：

  已知点

  静态

  On-The-Fly (OTF)后处理

  重新观测


    静态初始化

更多信息

 又见

静态初始化要求基准接收机位于已知的参考点，而流动接收机位于任何其它点。流动接收机在该点固定标准快速静态 的观测时间。观测时间将根据可获得的卫星数和测量中所使用的接收机类型而变化。顾及建议的快速静态观测时间和自身的经验，基于可利用的卫星和当地条件。


    已知点初始化

更多信息

 又见

已知点初始化是所有初始化类型中最稳固的和最可靠的。基准接收机和流动接收机都安置在已知的或以前测过的点上，流动接收机至少在该点上固定30秒。基线处理器使用已知坐标作为初始化的附加信息。


    后处理On-the-Fly (OTF)初始化

更多信息

 又见

OTF初始化要求保持锁定五颗卫星。基准接收机安置在已知点上采集GPS观测值。流动接收机采集同一时段的观测值，但流动接收机不要求在任何点上固定指定的时间长度。基线处理器使用该数据进行初始化，即使流动接收机在数据采集的整个时间移动。


    重新观测初始化

更多信息

 又见

重新观测初始化相似于已知点初始化，仅仅安置流动接收机的点不是提前已知的。代替流动接收机观测先前在相同的动态区域时段所观测的点。假设基线处理器能解算先前观测的同一点的从基准站到流动站的基线 。如果该假设成立，那么以前的基线解能用于以后的初始化。流动接收机应在以前的安置点上固定至少30秒。


    流动的和连续的动态数据

更多信息

 又见

连续的动态测量进行下列操作：

  地图地形要素，例如剖面，横截面，和等高线。

  移动交通工具的地图路径，例如飞机或轮船，同时也确定瞬时事件的坐标，例如打开照相机快门。事件通过发送一个信号到接收机事件端口在接收机中发生，导致事件标记的存储。

连续的动态测量有和走走停停动态测量相同的限制。但是，在连续的动态测量中，基线处理器不仅能解算接收机位置固定时而且也能解算流动接收机移动时测得的每个GPS观测值。例如，假如适当注意天线高度，在一个项目区域连续记录数据能进行地形测量。

既然连续的动态测量提供了接收机在每个历元的位置，该技术也能用于解算指定时间的接收机位置，例如事件标记的例子。做该工作基线处理器使用一个或多个和添写策略一起的事件任一边的位置来及时确定接收机在任何特殊情况下的位置。GPS处理式样用于控制事件添写用途：

  添写方式

  最大容许缺少历元

  时间偏移

注释：基线处理器自动给所有连续的点赋予点名。这是一种途径来确定是否与利用RTK连续技术获得的点有冲突。


     新图表命令（SV图表）

更多信息

 又见

选择该命令打开一个新的SV图表窗口。能打开，平铺，和层叠多重的SV图表窗口。能最小化单独的SV图表窗口并且能把它们的图标安置在SV图表客户区域。

访问它，从GPS信号图表窗口做下列之一：

  选择文件/新的图表。

  从SV图表工具栏，单击 [image] 。

显示一个新的客户窗口。用户能使用它显示附加的图表。


     导出命令（SV图表）

更多信息

又见

选择该命令导出当前激活的区域的原始卫星跟踪数据到一个文件。文件中的数据表包括一列现行图表中包括的每类原始卫星跟踪信息。

访问它，从GPS信号图表窗口做下列之一：

  选择文件/导出。

  从SV图表工具栏，单击 [image] 。

所导出的SV图表文件保存在文本文件(*.txt文件)中。


     打印命令（SV图表）

更多信息

又见

选择该命令打印显示在当前所选SV图表窗口中的图表。能把图表导出到打印机或文件中，取决于从打印对话框中所选的选项。

访问它，从GPS信号图表窗口做下列之一：

  选择文件/打印。

  从SV图表工具栏，单击 [image] 。

显示具有选择打印选项的选项的打印对话框。

考虑下列选项：

  用户能单击确认立刻以图像模式打印当前窗口中的图表。

  在所打印的页选择横向选项把图表旋转90度。

  在当前窗口中选择文件选项把土表写到打印机文件中。如果用户选择文件选项并且单击确认，将显示一个对话框要求命名文件名称。

  用户也能使用导出命令把用于产生图表的原始卫星信息写到文件中。这对于以表格格式证明原始卫星跟踪信息是有用的。随后用户能联合报告中的所导出的表格信息和图表。


     SV图表帮助命令（SV图表）

更多信息

又见

选择该命令显示SV图表命令和操作的帮助信息。

访问它，从GPS信号图表窗口做下列之一：

  选择帮助/SV图表帮助。

  从SV图表工具栏，单击 [image] 。

显示SV图表帮助。


     L1固定范围命令（SV图表）

更多信息

帮助 ...	又见
选择该命令以米显示时间线范围之上的所选卫星的L1固定范围数据。

访问它，做下列之一：

  选择视窗/数据/ L1固定范围。

  从对话框栏，单击L1固定范围。

在当前激活的窗口中显示L1固定范围信息。


     方位角命令（SV图表）

更多信息

帮助...	又见
选择该命令以度显示时间线范围之上的所选卫星的所采集的方位角数据。

查看方位角图表，做下列之一：

  选择视窗/数据/方位角。

  从对话框栏，单击方位角。


     高程命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示原始卫星高程信息。时间线范围之上的数据以度显示。

查看高程图表，做下列之一：

  选择视窗/数据/高程。

  从对话框栏，单击高程。

在当前窗口中显示高程数据。


     L1信噪比命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示时间线范围之上的所选卫星采集的L1载波的信噪比（SNR）数据。

查看L1信噪比图表，做下列之一：

  选择视窗/数据/L1信噪比。

  从对话框栏，单击L1信噪比。

在当前窗口中显示L1信噪比信息。


     L2信噪比命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示时间线范围之上的所选卫星采集的L2载波的信噪比（SNR）数据。

访问它，从GPS信号图表窗口做下列之一：

  选择视窗/数据/L2信噪比。

  从对话框栏，单击L2信噪比。

在当前窗口中显示L2信噪比信息。


     L1相位命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示时间线范围之上的所选卫星采集的L1载波相位数据。

查看L1相位图表，做下列之一：

  选择视窗/数据/L1相位。

  从对话框栏，单击L1相位。

在当前窗口中显示L1相位信息。


     L2相位命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示时间线范围之上的所选卫星采集的L2载波相位数据。

查看L2相位图表，做下列之一：

  选择视窗/数据/L2相位。

  从对话框栏，单击L2相位。

在当前窗口中显示L2相位信息。


     L1多普勒命令（SV图表）

更多信息

帮助 ...	又见
选择该命令以kHz显示时间线范围之上的所选卫星采集的L1载波多普勒数据。

L1多普勒是平均采样测量时间间隔的载波信号频率偏移量。它是标准的根据名义上的1575.42 MHz 的L1载波频率，参考接收机内部的时钟。L1多普勒包括所有接收机和卫星时钟频率的误差。在L1载波中它以赫兹表示。

查看L1多普勒图表，做下列之一：

  选择视窗/数据/L1多普勒。

  从对话框栏，单击L1多普勒。

在当前窗口中显示L1多普勒信息。


      L1辅助, CA命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示时间线范围之上的所选卫星采集的L1辅助C/A码信息。当没有采集卫星的L1辅助C/A信息时，命令的菜单选项和对话框栏不可使用。它仅仅适用于能同时跟踪L1 C/A码和L1 P码的接收机。

查看L1辅助C/A码信息，做下列之一：

  选择视窗/数据/L1辅助CA。

  从对话框栏，单击L1辅助CA。

在当前窗口中显示L1辅助C/A信息。


     钟差命令（SV图表）

更多信息

帮助 ...	又见
选择该命令以毫秒显示时间线范围之上的钟差信息。

查看钟差图表，做下列之一：

  选择视窗/数据/钟差

  从对话框栏，单击钟差。

在当前窗口中显示钟差数据。


     对话框栏命令（SV图表）

更多信息

帮助 ...	又见
选择该命令显示和隐藏对话框栏。对话框栏包括所有显示原始卫星跟踪信息的命令。

显示或隐藏对话框栏：

  选择视窗/对话框栏。

  按Alt+VD。

可使用这些对话框栏按钮：

  方位角

  高程

  L1范围

  L1 S/N

  L2 S/N

  L1相位

  L2相位

  L1多普勒

  L1辅助CA

  钟差

注：这些按钮复制SV图表菜单中的命令。

提示：用户能消减或不消减对话框栏。对话框栏能消减到靠近SV图表工具栏的区域或状态栏下的区域。


     工具栏命令（SV图表）

更多信息

 又见

选择该命令显示和隐藏SV图表工具栏。

显示或隐藏SV图表工具栏：

  选择视窗/工具栏。

  按Alt+VT。

用户每次选择该命令时，显示或隐藏工具栏。


     数据命令（SV图表）

更多信息

帮助 ...	又见

选择该命令显示显示命令的子菜单。单独命令显示特殊的一类原始卫星跟踪信息。

查看数据子菜单：

  选择视窗/数据

显示具有这些命令的子菜单：

  方位角

  高程

  L1范围

  L1 S/N

  L2 S/N

  L1相位

  L2相位

  L1多普勒

  L1辅助CA

  钟差

注：这些命令复制SV图表对话框栏中的命令按钮。


     退出命令（SV图表）

更多信息

 又见

选择该命令结束SV图表查看时段。

选择退出命令，做下列之一：

  选择文件/退出。

关闭SV图表。


     使用帮助命令（SV图表）

更多信息

 又见

选择该命令显示窗口帮助系统使用帮助。

查看窗口帮助系统使用帮助，做下列之一：

  选择帮助/使用帮助。

显示窗口帮助系统使用帮助。


     索引命令（SV图表）

选择该命令开始Trimble Geomatics Office软件帮助系统。

查看Trimble Geomatics Office帮助，做下列之一：

  选择帮助/索引。

显示帮助系统的打开主题。


     打印图表

图表的图形图像能导出到打印机或打印机文件中。

缺省的，图表以图形模式打印。用户能从打印机设置对话框中选择横向旋转图表90度。

提示：用户也能导出与图表相关的卫星跟踪数据到文件中，打开文本编辑器中的文件，并且打印数据。这能用于证实所打印的图表。


     导出图表数据

多套划分的卫星跟踪数据能显示在图表窗口中并且导出到一个文件。

下列是包含L1和L2信噪比图表数据的一个文件的前几行摘录：

文件29932370.DAT中的卫星SV 1的时间线卫星数据导出

Time                       	       L1 S/N   L2 S/N

14:05:25.0  1998/09/10       52.75     38.00

14:05:30.0  1998/09/10       52.25     38.50

注：当更多数据类型包括在相同的图表窗口中时，另外的列加到所导出的文件中。


     分析图表

更多信息

 又见

卫星跟踪的图表显示在一个或多个SV图表窗口中，能真实地分析差异。这用于识别接收机可以跟踪一颗或多颗卫星的问题。在某些情况下，它可以帮助停用所有的，或部分的来自一颗或多颗卫星的观测。


     显示SV图表

更多信息

 又见

使用菜单或对话框栏命令能显示所采集的卫星跟踪数据的图表。

当查看图表时，用户能做下列的：

  在同一窗口中显示多重类型的所采集的卫星跟踪数据。

  打开多重窗口，每个显示一种或多种类型的所采集的卫星跟踪数据。

  使用鼠标点图表的数据区域，并且读状态栏指示器获得数据的值和采集时间

  真实地分析两种或多种类型的所采集的跟踪数据查看差异。

  平铺和层叠窗口。

  最小化和最大化窗口。

  排列最小化的窗口图标。

  使用标准窗口命令调整大小，移动，和恢复窗口。

  在任何时候关闭客户窗口。

  最小化和最大化SV图表窗口。当最小化时，图标显示在窗口任务栏。


     图表 - 概览

在时间线中查看SV图表分析所选卫星采集的原始卫星跟踪信息的图表。

能最小化，最大化，和编辑像任何窗口应用的应用窗口。当最小化时，SV图表图标显示在窗口任务栏中。

在窗口中用户能同时划分一种或多种类型的原始卫星跟踪信息，使用图表作为分析观测范围期间采集的原始卫星数据的诊断工具。

当显示数据时，图表是当前的。用户能移动鼠标穿过图表并且读出数据的值和采集时间。鼠标指针的位置随着它在图表上的滑动决定状态栏指示器面板的容量。

为了获得更多的SV图表信息，参见这些主题：

  SV图表窗口

  SV图表命令

用SV图表窗口工作时，能进行这些操作：

  显示图表

  分析图表

  导出图表数据

  打印图表


     SV图表命令 - 概览

所有的SV图表命令都可从菜单中得到。一些命令也可从工具栏和对话框栏中得到。许多命令有键盘快捷方式。

这些命令可从GPS信号图表窗口中得到：

文件命令

  新的图表

  导出�

  打印�

  打印设置

  退出

查看命令

  数据

  工具栏

  对话框栏

窗口命令

  层叠

  平铺

  排列图标

帮助命令

  SV图表帮助

  索引

  使用帮助

  关于时间线


     SV图表窗口 - 概览

更多信息

对话框	又见
概览

使用该窗口划分和真实地分析与时间范围相对的观测期间所选的卫星的起作用的卫星采集的原始卫星跟踪信息。SV图表有它自己的菜单，状态栏，工具栏，对话框栏，和图表窗口。能显示，最小化，和最大化具有单独几套卫星跟踪图表的多重图表窗口。标准的窗口命令能用于调整大小，恢复和移动这些窗口。

支持许多SV图表的命令包括打印图表和导出图表数据的命令。

为了获得更多的信息，参见这些主题：

  SV图表菜单

  SV图表状态栏

  SV图表工具栏

  SV图表对话框栏

  SV图表窗口


     SV图表窗口

更多信息

 又见

多重图表能显示在相同的窗口或打开新的窗口显示单独的图表或选择的图表。

考虑这些帮助：

  能打开新的窗口，单独的图表或多重图表能显示在相同的窗口。

  能从窗口或控制菜单中选择窗口命令最小化，最大化，关闭，恢复，和调整窗口大小。

  窗口命令能用于平铺和层叠窗口以及排列窗口图标。

  当前窗口中的图表能导出到打印机或文件中。

  这些用于产生图表的数据也能以表格形式导出到一文件。这些文件可以打印出来用于任何文本编辑。


     图表菜单

 概述和更多信息

使用菜单执行查看，打印和输出原始卫星跟踪数据图表的命令。

所有的SV图表命令都可从菜单中获得。一些命令也可从工具栏和对话框栏中获得。许多命令有键盘快捷方式。

这些命令可从GPS信号图表窗口中获得：

文件命令

  新的图表

  输出�

  打印�

  打印设置

  退出

查看命令

  数据

  工具栏

  对话框栏

窗口命令

  层叠

  平铺

  排列图表

帮助命令

  SV图表帮助

  索引

  使用帮助


     SV图表工具栏

 概述和更多信息

使用工具栏打开新的图表窗口，输出数据，打印图表，和显示帮助。

下列命令可使用：

	新的图表窗口
	输出数据到文件
	打印图表


     SV图表状态栏

 概述和更多信息

窗口中状态栏显示与鼠标指针所在位置相应的观测值和时间。

当把观测值记录在观测时间范围之上时，用户能使用鼠标识别。

消息指示器窗格

SV图表消息显示在该指示器窗格。当选择栏出现在菜单命令之上或鼠标点在工具栏或对话框栏按钮上时，关于命令的更详细的信息显示在该窗格中。

跟踪数据指示器窗格

显示在该指示器窗格中的值变化，取决于显示在图表和当前鼠标位置的数据类型。

当在相同的窗口中划分多重类型的卫星跟踪数据时，该指示器用适用于特殊数据类型的观测值的单位自动更新。用户能使用图表底部的图例获得显示在图表中的卫星数据的观测值的单位。鼠标指针的当前位置随着它在所划分的数据上的滑动决定显示在指示器中的观测值的单位。

时间指示器窗格

卫星跟踪数据的采集时间显示在该窗格。时间值显示在GPS周/秒或Windows当地时间。用户能从时间选项对话框改变时间格式。


     SV图表对话框栏

 概述和更多信息

使用对话框栏按钮划分所选卫星和起作用的测量的观测时期所采集的原始卫星跟踪数据的值。

划分数据：

  单击对话框栏中任何按钮的联合。

用户能在图表中的任何观测值上移动鼠标并且读状态栏获得原始卫星跟踪数据的观测时间和值。

提示：用户能消减或不消减对话框栏。对话框栏能消减到靠近SV图表工具栏的区域或状态栏下的区域。

这些对话框栏按钮可使用：

L1固定范围

使用该按钮以米划分观测时间之上所跟踪的卫星采集的L1固定范围。为了获得更多信息，参见L1固定范围命令。

方位角

使用该按钮以度划分观测时间之上卫星采集的所跟踪的方位角数据。为了获得更多信息，参见方位角命令 。

高程

使用该按钮以度划分观测时间之上卫星采集的所跟踪的高程数据。为了获得更多信息，参见高程命令。

L1信噪比

使用该按钮划分观测时间之上采集的所跟踪的L1载波信噪比数据。为了获得更多信息，参见L1信噪比命令。

L2信噪比

使用该按钮划分观测时间之上采集的所跟踪的L2载波信噪比数据。为了获得更多信息，参见L2信噪比命令。

L1相位

使用该按钮以周期划分观测时间之上采集的所跟踪的L1载波相位数据。为了获得更多信息，参见L1相位命令。

L2相位

使用该按钮以周期划分观测时间之上采集的所跟踪的L2载波相位数据。为了获得更多信息，参见L2相位命令。

L1多普勒

使用该按钮以kHz划分观测时间之上的所跟踪的L1多普勒。为了获得更多信息，参见L1多普勒命令。

L1辅助C/A

为了获得更多的信息，参见L1辅助C/A命令。

钟差

使用该按钮以毫秒划分观测时间之上的钟差。为了获得更多信息，参见钟差命令。


     命令(时间线)

更多信息

帮助 ...	又见
选择该命令过滤显示在时间范围查看器中的连续时段。

从时间范围查看器过滤连续时段：

1.	右击时间范围查看器背景。

2.	选择视窗 过滤器 / 连续。

显示或隐藏观测时段HIDTL_Occupation_Objects。

过滤连续时段：

1.	单击时间范围查看器背景。

2.	在时间线工具栏中，单击 [image] 。

显示或隐藏观测时段。


     删除命令（时间线）

更多信息

 又见

在时间线中选择该命令删除测量或Occupation要素。因为这些时间线要素表示工程数据，工程中所有参考相关的数据都是无关的。

从时间范围查看器中选择删除命令：

1.	右击测量或观测要素。

2.	选择删除。

从测量 视窗中选择删除命令：

1.	单击测量或观测要素。

2.	做下列之一：

  选择编辑 / 删除。

  按Del键。

删除与要素相关的测量或观测数据，要素的出现改变了表示曾经存在于时间线中这个位置的数据的黑框矩形。从工程中删除数据是无关的并且不再被访问。

警告：考虑从工程中删除测量或观测数据的影响。


DOP Plot 命令 (时间线)
     DOP图命令 (时间线)

更多信息

 又见

选择该命令查看DOP Plot显示。仅仅当在时间范围查看器中选择观测值时，该命令可使用。

从观测菜单中查看DOP Plot：

1.	右击观测 要素HIDTL_Occupation_Objects。

2.	选择星历信息 / DOP Plot。

显示DOP Plot显示。

从Plot工具栏中查看DOP Plot：

1.	单击观测要素。

2.	从Plot工具栏中，单击 [image] 。

显示DOP Plot显示。


Enable/Disable命令(时间线)
     激活/取消命令(时间线)

更多信息

帮助 ...	又见
选择该命令激活或不激活时间线要素。因为时间线要素表示实际的工程数据，数据也是激活的或不激活的。

当进行试错法检验改进基线解质量时，该命令尤其用于不激活右问题的数据。不激活元素之后如果在基线处理结果中没有发现改进，重新激活那个元素。

当编辑小区域的GPS观测值时该命令也可用，例如包含大量周跳的区域。

注：能激活和不激活卫星，GPS观测值，和所选区域的GPS观测值。一些时间线要素被保护并且不能直接被不激活棗当不激活母体元素时，仅仅不激活它们。这些被保护的要素包括星历图标 测站图标。

从时间范围查看器中选择激活/取消命令：

1.	选择卫星图标或GPS 观测值要素。

2.	右击要素。

显示包含激活/取消命令的菜单。

在GPS观测值中从所选区域中选择激活/取消命令：

1.	拖拉GPS观测值区域周围的所选矩形。

2.	在所选矩形中右击。

显示包含激活/取消命令的菜单。

从所选GPS观测值中选择激活/取消命令：

1.	拖拉GPS观测值要素区域周围的所选矩形。

2.	在所选矩形中右击。

显示包含激活/取消命令的菜单。


    星历命令(时间线)

更多信息

帮助 ...	又见
选择该命令过滤显示在时间范围查看器中的星历图标。每次执行该命令，显示或隐藏星历图标。

从时间范围查看器中过滤星历图标：

1.	右击时间范围查看器背景。

2.	选择视窗 过滤器。

显示包含星历命令的子菜单。

过滤星历图标：

1.	单击时间范围查看器背景。

2.	从Timeline工具栏，单击 [image] 。


     星历信息命令(时间线)

更多信息

帮助 ...	又见
选择该命令查看具有查看所选观测值DOP图表和Skyplot选项的子菜单。

查看星历信息子菜单：

1.	选择观测值要素。选中该观测值。

2.	右击观测值。

显示包含星历信息命令的菜单。

这些子菜单命令可用于：

  DOP 图表HIDTL_Satellite_DOP_Display

  天空图

注：以上命令也可从图表工具栏中获得。


     扩大所有的命令(时间线)

更多信息

帮助 ...	又见
在时间线控制栏中选择该命令打开所有数据文件夹。

注：该命令变得可用以前至少必须关闭一个数据文件夹。

从控制栏中选择扩大所有的命令：

  .右击控制栏背景或数据文件夹。显示包含扩大所有的命令的菜单。

从时间线工具栏中选择扩大所有的命令：

1.	单击控制栏IDH_Timeline_Control_Bar背景或数据文件夹。

2.	从时间线工具栏，单击 [image] 。

提示：用户也能通过在数据文件夹中单击 [image] 打开单独的数据文件夹。


     下一个命令（时间线）

更多信息

帮助 ...	又见
选择该命令显示时间范围查看器的下一测量要素。在数据文件夹中多次选择该命令快速显示时间范围查看器的每个连续测量要素。

从时间范围查看器中选择下一个命令：

  右击时间范围查看器背景。显示包含下一个命令的菜单。

从时间线工具栏中选择下一个命令：

1.	单击时间范围查看器背景，测量要素，或观测值要素。

2.	在时间线工具栏，单击 [image] 。

提示：当显示观测值要素时，用户也能获得直接路径。例如，用户能从测量视窗中查看基线属性和从选项表中选择观测值。这个显示时间范围查看器所选观测值并且选中它。

提示：用户也能使用缩放程度命令查看整个时间线，选择想要得到的观测值，在时间范围查看器中使用缩放范围命令查看它。


     返回上一级菜单命令（时间线）

更多信息

帮助 ...	又见

选择该命令显示时间范围查看器以前的观测值终点。在测量数据中多次选择该命令快速显示时间范围查看器的每个连续的观测值。

从时间范围查看器中选择返回上一级菜单命令：

  右击时间范围查看器背景，测量矩形，或观测值要素。显示包含返回上一级菜单命令的菜单。

从时间线工具栏中选择返回上一级菜单命令：

1.	单击时间范围查看器背景，测量HIDTL_Survey_Object要素，或观测值HIDTL_Occupation_Objects要素。

2.	在时间线工具栏中，单击 [image] 。

提示：当显示观测值要素时，用户也能获得直接路径。例如，用户能从测量视窗中查看基线属性和从选项表中选择观测值。这个显示时间范围查看器所选观测值并且选中它。

提示：用户也能使用缩放程度命令查看整个时间线，选择想要得到的观测值，在时间范围查看器中使用缩放范围命令查看它。


     卫星命令（时间线）

更多信息

帮助 ...	又见
选择该命令过滤显示在时间范围查看器中的所有的GPS观测值。每次执行该命令，它显示或隐藏GPS观测值。

从时间范围查看器过滤GPS观测值：

1.	右击时间范围查看器背景。

2.	选择查看过滤器。

显示包含卫星命令的子菜单。

从时间线工具栏过滤GPS观测值：

1.	单击时间范围查看器背景。

2.	从时间线工具栏，单击 [image] 。

当执行该命令时，也显示或隐藏所有与GPS观测值相关的星历图标。


     缩小所有的命令（时间线）

更多信息

帮助 ...	又见
在时间线控制栏中选择该命令关闭所有数据文件夹。

注：该命令变得可用前，至少一个数据文件夹必须打开。

从控制栏选择缩小所有的命令：

  右击控制栏背景或数据文件夹。显示包含缩小所有的命令的菜单。

从时间线工具栏选择缩小所有的命令：

1.	单击控制拦背景或数据文件夹。

2.	从时间线工具栏，单击

提示：用户也能通过在文件夹中单击 [image] 符号关闭单独的数据文件夹。


    Skyplot命令(时间线)

更多信息

 又见

该命令仅仅当从时间范围查看器中选择观测值要素时可用。Skyplot 显示显示观测时刻从所选点可见的卫星星座的当地平面图。从观测时刻当前的根据方位角和高程显示的星历信息计算卫星位置。

查看观测值的Skyplot：

1.	打开数据文件夹，做下列之一：

  .从控制栏，使用这些操作之一打开数据文件夹。

  在数据文件夹上单击 [image] 。

  右击数据文件夹并且选择扩大所有的。

  从时间线工具栏，单击 [image] 。

第一个操作显示所选数据文件夹的卫星图标。两个交替的操作展开所有的数据文件夹。

2.	选择观测值要素。

3.	选择Skyplot命令，做下列之一：

  右击观测值显示和选择星历信息显示具有Skyplot命令的子菜单。

  从图表工具栏，单击


     SV图表命令（时间线）

更多信息

 又见

选择该命令查看SV图表显示。SV图表包括查看和打印所选卫星跟踪信息的命令。它也用于分析单颗卫星的原始卫星跟踪信息。该命令仅仅当从控制栏选择卫星图标时可用。

查看SV图表：

1.	打开数据文件夹，做下列之一：

  从控制栏，使用这些操作之一打开数据文件夹：

  在想打开的数据文件夹上单击 [image] 。

  右击数据文件夹选择扩大所有的。

  从时间线工具栏，单击 [image] 。

第一个操作显示所选数据文件夹的卫星图标。两个交替的操作打开一个或多个数据文件夹。

2.	选择需要的卫星图标HIDTL_SV_Object。

3.	选择SV图表命令，做下列之一：

  右击卫星图标显示具有SV图表命令的菜单。

  从时间线工具栏，单击 [image] 。


     时间选项命令（时间线）

更多信息

对话框	又见
选择该命令显示具有选择用于在时间标尺，时间线属性对话框，SV图表，Skyplot，DOP图表，和测量视窗状态栏中显示时间时间格式的时间选项对话框。

查看对话框，做下列之一：

  双击时间标尺。

  右击时间标尺显示具有时间选项命令的菜单。


     查看过滤器命令（时间线）

更多信息

帮助 ...	又见
选择该命令显示用于过滤显示在时间范围查看器中信息的命令的子菜单：

1.	右击时间范围查看器背景。

2.	从菜单中选择查看过滤器。

显示命令的子菜单。

可使用下列命令：

  连续的

  卫星

  星历

注：该命令在时间线工具栏中不可用，但子菜单中的单独命令可使用。


    放大命令（时间线）

更多信息

 又见

选择该命令缩放时间范围查看器200%。更新时间标尺中的起始和终止文件反映不足的时间范围。

从时间范围查看器中选择放大命令：

  右击时间范围查看器背景。显示包含放大命令的菜单。

从测量视窗中选择放大命令：

1.	单击时间范围查看器背景。

2.	选择放大命令，做下列之一：

  选择视窗/缩放显示具有放大命令的子菜单。

  从视窗控制工具栏，单击 [image] 。


     缩放程度命令（时间线）

更多信息

 又见

选择该命令缩小时间范围查看器查看整个时间线。该命令用于显示与全部时间线相关的时间线要素占有的时间范围。用户能使用该命令和缩放以前的命令返回原始的放大倍率。

从时间线视窗区域中选择缩放程度命令：

  右击时间线要素或窗口背景。

显示包含缩放程度命令的菜单。

从测量视窗中选择缩放程度命令：

1.	单击时间线要素或时间范围查看器背景。

2.	选择查看/缩放显示具有缩放程度命令的子菜单。


    缩小命令（时间线）

更多信息

 又见

选择该命令缩小时间范围查看器50%。更新时间标尺中的起始和终止时间区域反映较久的时间范围。

从时间线中选择缩小命令：

  右击时间范围查看器背景。显示包含缩小命令的菜单。

从测量视窗中选择缩小命令：

1.	时间范围查看器单击时间范围查看器背景。

2.	做下列之一：

  选择视窗/缩放显示具有缩小命令的子菜单。

  从视窗控制工具栏，单击 [image] 。


     缩放以前的命令（时间线）

更多信息

 又见

选择该命令缩放成以前的放大倍率。

从时间线视窗区域中选择缩放以前的命令：

  右击时间线要素。显示包含缩放以前的命令的菜单。

从测量视窗中选择缩放以前的命令：

1.	单击时间线要素。

2.	选择命令，做下列之一：

  选择视窗/缩放显示具有缩放以前的命令的子菜单。

  .从视窗控制工具栏，单击 [image] 。


     缩放范围命令（时间线）

更多信息

 又见

选择该命令缩放所选时间线要素的时间范围到时间范围查看器的宽度。

缩放要素填充时间范围查看器：

1.	选择时间线要素。

2.	右击要素。

3.	选择缩放范围。


     事件命令（时间线）

更多信息

帮助 ...	又见
在时间范围查看器中选择该命令查看事件图标：

  从时间线工具栏，单击 [image] 。如果事件包括在数据中，事件图标显示在时间范围查看器上。


     属性命令（时间线）

更多信息

帮助 ...	对话框
选择该命令显示所选时间线要素的属性对话框：

1.	右击时间线要素。

2.	选择属性。显示适用的属性对话框。

属性命令存在于这些对话框中：

  接收机属性

  GPS观测值

  测量

  静态观测值

  连续观测时段

  星历图标

提示：用户也能双击时间线要素查看它的属性。


     计划编制图表命令（时间线）

选择该命令显示或隐藏计划编制图表工具栏：

  选择视窗/工具栏/计划编制图表。每次执行该命令，显示或隐藏计划编制图表工具栏。


     时间线命令（工具栏）

选择该命令显示或隐藏时间线工具栏：

  选择视窗/工具栏/时间线。每次执行该命令，显示或隐藏时间线工具栏。


     测站命令（时间线）

更多信息

帮助 ...	又见
能过滤小的红色的三角形测站图标和所显示的识别静态观测值的标签。

1.	查看时间线。

2.	从时间线工具栏，单击 [image] 。

每次执行测站命令，打开或关闭测站图标。

注：测站图标不能删除或停用棗它们仅能用它们的母体观测值来删除或停用。


     选择所有的命令（时间线）

更多信息

帮助 ...	又见
从时间范围编辑区域选择该命令来选择包含观测时间和数据的区域中的所有数据。在剪切或复制数据到剪贴板之前用于选择所有数据。

在时间范围编辑区域中选择所有数据：

1.	单击开始或结束时间范围编辑区域。

2.	右击选择选择所有的。

选择区域中的所有数据。


    接收机属性对话框

更多信息

 概述和更多信息

使用该对话框获得用于采集测量数据的接收机的普通信息。所有区域都是从下载的接收机信息记录，或RINEX文件中的标题记录获得的只读数据。

访问接收机属性对话框：

  双击数据文件夹。显示具有这些只读区域的接收机属性对话框。

序列号

该区域显示接收机序列号。

接收机类型

该区域显示接收机模型。


    测量属性对话框

更多信息

对话框	又见
使用该对话框查看单独测量数据记录时段的信息。

打开测量属性对话框，做下列之一：

  双击测量要素。

  右击测量要素，选择属性。

可获得这些数据区域：

时段ID

该区域显示测量时段的名称。如果需要以一种新方法识别时段，测定新时段ID的类型。

数据文件名称

该区域显示相关测量文件的名称。

开始时间

该区域以Windows的GPS周/秒的当地时间显示测量时段的开始时间。时间格式由当地时间选项设置决定。

结束时间

该区域显示以Windows的GPS周/秒的当地时间显示测量时段的结束时间。时间格式由当地时间选项设置决定。

导航处理器翻译

该区域显示接收机导航处理器的固件翻译（仅限于Trimble接收机）。

历元比

该区域以秒显示最小同步比，用于采集测量时段的数据。

信号处理器翻译

该区域显示接收机信号处理器的固件翻译（仅限于Trimble接收机）。

高度截止角

该区域显示采集测量数据时的有效的高度截止角。

DC类型

如果测量数据用于测量中，该区域显示数据采集器和测量控制器的翻译数。


    观测/数据时段对话框 - 概述

更多信息

帮助 ...	对话框	又见
使用该对话查看和编辑属于静态观测和连续的流动时段的所有信息。对于每个时段都能打开单独的对话框，允许比较多重时段的数据。

查看观测/数据时段对话框，做下列之一：

  双击观测要素。

  右击观测要素，选择属性。

可获得两张表：

  时段

  天线

观测/数据时段对话框的右上角是一个左右旋转按钮。如果测量包括多重观测值，使用旋转按钮从下一个或先前观测值显示信息。如果下一个观测值的对话框显示在其它属性对话框中，并且按压右箭头按钮，则会遗漏那个观测值。


    观测/数据时段对话框 - 时段标签

更多信息

帮助 ...	对话框	又见
时段标签显示编辑的所有观测值信息。

查看时段标签，做下列之一：

  双击观测要素。

  右击观测要素，选择属性

显示具有显示的时段标签的观测/数据时段属性对话框。

可获得这些区域或控制：

点名

读取该区域获得观测观测值的点的名称。该区域对于流动的和连续的时段是一个空格。

时段类型

从表中选择一个选项改变这些类型中的一个时段：

  静态观测

  快速静态观测

  走走停停观测

  流动时段

  连续时段

注：可能或不可能显示静态和快速静态选项，取决于文件中可获得的数据类型。

警告：把观测值的名称变为流动的或连续的应小心谨慎。如果把静态观测变成连续的，参考那个观测值测站的测站应删除。

开始时间

编辑该区域改变观测的开始时间。时间以Windows的当地时或GPS周/秒来显示，取决于当地时间选项设置。

结束时间

编辑该区域改变观测的结束时间。时间以Windows的当地时或GPS周/秒来显示，取决于当地时间选项设置。

提示：在时间范围查看器中选择观测要素和在时间标尺中改变开始和结束时间区域也能编辑开始和结束时间。


    观测/数据时段对话框 - 天线标签

更多信息

帮助 ...	对话框	又见
使用该标签调时段天线高度（以米为单位），天线类型，和测量值类型。

查看天线属性：

1.	打开观测/数据时段对话框，做下列之一：

  双击观测要素。

  右击观测要素，选择属性。

显示观测/数据时段对话框。

2.	单击天线。

显示天线属性。

天线高度

使用该区域查看或编辑天线的测量高度。

类型

使用该区域查看或选择与接收机相连的天线类型。

测量

使用该区域查看或选择用于测量天线高度的方法。

下面的测量区域是一组控制使用天线信息的电磁波接收装置按钮。包括：

  仅供该观测使用仅仅用于对选择的观测值或时段的改变。这是默认设置。

  用于该时段的观测和随后的观测仅仅用于对选择的观测值或时段，以及所有随后的测量要素的观测值和时段的改变。

  用于该时段的所有观测值用于对测量要素中所有观测值和时段的改变。


    GPS观测值属性对话框

更多信息

帮助 ...	对话框	又见
使用该对话框查看用于所选择的GPS观测值要素(s)的观测值类型。

查看GPS观测值属性对话框：

1.	在控制栏中打开数据文件夹，做下列之一：

  右击数据文件夹，选择放大所有的。

  在时间线工具栏中单击 [image] 。

  在数据文件夹中单击 [image] 符号。

显示时间范围查看器中的所有GPS观测值和控制栏中的所有SV图标。

提示：在任何时候通过在时间线工具栏中单击 [image] 或在菜单中右击数据文件夹并选择缩小所有的可以隐藏这些要素 [image] 。

2.	显示属性对话框，做下列之一：

  双击GPS观测值要素。

  右击GPS观测值要素，选择属性。

显示GPS观测值属性对话框。

可获得这些区域：

开始

编辑该区域改变所选择的GPS观测值的开始时间。显示在该区域中的时间是最初基于时间范围查看器中的当前GPS观测值选项的。用于GPS观测数据的任何变化都是基于这个开始时间的。如果改变这个区域中的开始时间，所有变化都用于从卫星编辑表或时间范围查看器中所选择的GPS观测地区中所选择的所有当前卫星。

结束

编辑该区域改变所选择的GPS观测值的结束时间。显示在该区域中的时间是基于时间范围查看器中的当前GPS观测值选项的。用于GPS观测数据的任何变化都是基于这个结束时间的。如果改变这个区域中的结束时间，所有变化都用于从卫星编辑表或时间范围查看器中所选择的GPS观测地区中所选择的所有当前卫星。

观测值类型

使用该控制组不激活或激活GPS观测值中所包括的观测值类型。每个观测值类型都是原始卫星信息的一种形式。

可获得这些观测值类型复选框：

  L1相位

  L1 P码

  L1 C/A码

  L2完整相位

  L2半相位

  L2 P码

  L2加密

查看或编辑观测值时顾及这些指导方针：

  当清除复选框显示不包括的数据类型时，观测值类型的检查标记显示数据的使用。

  灰色的检查标记显示GPS观测之中激活的和未激活的范围，没有对观测值类型所进行的操作。

  检查标记旁变暗的文本显示不可获得的观测值类型。

  清除检查标记停用所选择的数据。

重新设置

单击该按钮把所有观测值类型的复选框重新设置成它们的原始状态棗即，野外采集观测数据的状态。

卫星编辑

在表中选择复选框来选择卫星和它们相关的原始GPS观测数据来编辑。

注：当在表中选择多颗卫星时，属性上的变化用于从属性对话框中选择的时间范围上的所有GPS观测值。

提示：也能直接在时间范围查看器中通过拖拉一组GPS观测值周围的选择矩形或GPS观测值周围的一个小区域来选择GPS观测值。为了获得更多的信息，参见选择和编辑GPS观测。

激活所有的

单击该按钮激活所有可获得的从开始和结束区域所定义的时间范围上的卫星编辑表中选择的卫星观测值类型。

停用所有的

单击该按钮停用所有可获得的从开始和结束区域所定义的时间范围上的卫星编辑表中选择的卫星观测值类型。


    L1相位

 概述和更多信息

当接收机恢复L1相位观测值时，可获得该观测值类型。单频或双频接收机能跟踪该数据。

如果设置，能清除复选框（对于单颗卫星，卫星的选择，或GPS观测原理的范围）停用L1相位数据。


    L1P码

 概述和更多信息

当在L1载波上跟踪L1P码时，可获得该观测值类型。当关闭反欺骗时，大多数当前的双频接收机和精选的单频接收机能跟踪该数据。

如果设置，能清除复选框（对于单颗卫星，卫星的选择，或GPS观测原理的范围）停用L1P码数据。


    L1C/A码

 概述和更多信息

当在L1载波中跟踪粗/捕获码时，可获得该观测值类型。单频或双频接收机能跟踪该数据。

如果设置，对于单颗卫星，卫星的选择，或GPS观测原理的范围，能清除复选框停用L1 C/A码数据。


    L2完整相位

 概述和更多信息

当GPS接收机能恢复完整相位L2载波相位观测值时，可获得该观测值类型。

如果设置，能清除复选框（对于单颗卫星，卫星的选择，或GPS观测原理的选择范围）停用L2完整相位数据。


    L2半相位

 概述和更多信息

当接收机仅能恢复半相位L2载波相位观测值时，可获得该观测值类型。一些双频接收机能采集该数据。

如果设置，对于单颗卫星或卫星的选择，能清除复选框停用L2半相位数据。


    L2 P码

 概述和更多信息

当在L2载波上跟踪L2P码时，可获得该观测值类型。当关闭反欺骗（A/S）时，大多数当前的双频接收机都能采集该数据。

如果设置，能清除复选框（对于单颗卫星，卫星的选择，或GPS观测原理的范围）停用L2P码数据。


    L2加密

 概述和更多信息

当在启用反欺骗（A/S）期间加密L2P码时，可获得该观测值类型。Trimble接收机使用提供有助于在L2上跟踪码的专用技术，即使在加密期间。通过这种专用技术获得的观测值称为L2加密。

如果设置，能清除复选框（对于单颗卫星，卫星的选择，或GPS观测原理的范围）停用L2加密数据。


    卫星星历属性对话框

更多信息

帮助 ...	Dialog	又见
使用该对话框查看定期播送给GPS用户的卫星星历信息。该信息来自于卫星数据并且不能编辑。

查看卫星星历属性对话框：

1.	查看星历图标，做下列之一：

  在时间线工具栏中单击 [image] 。

  右击时间范围查看器，选择过滤器/星历。

蓝色的星历图标显示在SV跟踪信息上。

2.	查看星历属性，做下列之一：

  双击想要得到的卫星的星历图标。

  右击想要得到的卫星的星历图标，选择属性。

卫星星历信息对话框打开。

可得到这些选项：

卫星

该区域显示分配给卫星的卫星PRN标识符。

采集的时间

当从卫星接收到广播星历时，该区域显示GPS周/秒或当地时间。时间格式由当地时间选项集决定。

IODC

该区域显示包括在广播星历中的数据，时钟值的输出。

星历的时间

当发出星历时，该区域显示GPS周/秒或当地时间。时间格式由当地时间选项集决定。

来自历元的时间

该区域显示来自星历参考历元的最近时刻的时间。

GPS周

当接收到星历时，该区域显示GPS周。

GPS周0（零点）是1980年1月6日。GPS周的周期是1,024周（0-1023）或7,168天。GPS周的周期在1999年8月21日午夜。在这个时刻，卫星广播的GPS周周0（零点）。但是，Trimble接收机内部保持一个连续的周计数。

根据UTC，在每个GPS周的星期六午夜GPS归零。

URA

该区域显示转换成米的卫星的User Range Accuracy。URA是卫星数据质量的距离修正精度指示器。

URA警报

该区域使用户知道对于卫星是否打开或关闭用户范围精度警报旗标。当范围精度比URA指定的值糟糕时，设置该旗标。

健康状况

该区域显示包括在星历中的卫星健康状况信息。健康状况信息是一个卫星信号广播质量的指示器。当该区域读：

All SV Data OK. 时，卫星健康状况好。

能显示许多其它值，这些值一般暗示卫星健康状况不好。为了得到更多的这些信息，拷贝ICD-GPS-200出版物，在Bibliography中参考。

A/S

该区域使用户知道对于卫星是否打开或关闭反欺骗模式旗标。


   时间选项对话框

更多信息

帮助 ...	对话框
使用该对话框在时间标尺和在所有时间线对话框，显示，和状态栏中显示的时间中选择显示时间范围的时间格式

查看时间选项对话框，做下列之一：

  双击时间标尺。

  右击时间标尺，选择时间选项。

显示时间选项对话框。

可获得这些选项：

当地时间

在Windows当地时间格式中选择该区域显示时间。

GPS周/秒

在GPS周/秒中选择该区域显示时间。

GPS周0（零点）是1980年1月6日。GPS周的周期是1,024周（0-1023）或7,168天。GPS周的周期在1999年8月21日午夜。在这个时刻，卫星广播的GPS周周0（零点）。但是，Trimble接收机内部保持一个连续的周计数。

根据UTC，在每个GPS周的星期六午夜GPS跳秒归零。


    连续时段

更多的信息

帮助 ...	对话框	又见
连续时段表示移动的接收机连续的采集数据的时间范围。连续时段的目的是处理每一个测量周期的从基准站到接收机的基线。它与流动时段的区别在于流动时段将不进行处理。连续时段在处理前最初是没有一个点连测。然而，一旦处理完成，一个点产生并被存在项目中并用于每一个接收机的测量周期，因此在测量视窗中显示接收机的路径。

双击一个连续时段要素，查看或编辑它的属性。

用户可以右击时段要素的任何一处查看用于时段数据的命令菜单。

连续时段的时间范围可以调整。如果不想进行处理解算，连续时段也可变为流动时段。

因为图形窗口与时间线连接在一起，观测的点和图形窗口中所选的基线都将在时间线和VICEＶＥＲＳＡ选中。例如，用户可以在时间线选择一个连续时段查看它有关的点和图形窗口中所选的基线。一旦点或基线被选择，用户可以查看它们的属性获取有关观测的更多信息。

当选择了连续时段，两个区域显示出观测时间内或时段的卫星星座信息。为了获得更多信息，参见下列主题：

  DOP 图

  天空图

提示：在图形窗口中访问属性窗口，可以引导通过时间线查找所选的观测。从此对话框选择的基线和点的观测也可在时间线中选择。一旦被选择，用户可以双击时间线的观测元素查看它的属性。

观测和时段元素以方形彩色代码显示，容易辨识。为了更多的信息，参见观测彩色代码表。


    时间范围查看器

更多的信息

帮助 ...	对话框	又见

考虑到时间查看器是一个功能强大的工具�它不仅能够查看整条时间线，而且可以显示面板或者缩放来显示时间线的小范围。

时间线为缩放和显示时间范围查看器提供了几种选项，用户可以选择时间线上的信息。对于像观测和GPS观测要素，时间范围查看器提供了两种方式显示这些要素。

  选择缩放命令：

  放大

  缩小

  放大到最大

  缩放到以前大小

  缩放到面板大小

  编辑时间范围域显示时间范围查看器的面板选择时间线的区域。

时间标尺覆盖了观测的时间范围，它由时间标尺的左右两端的时间范围域显示。如果时间范围太大，时间线自动显示最后一天数据的面板。

时间线要素描述测量过程中收集的数据。因为时间线和图形窗口内部是连在一起的，所以此窗口中采集的数据也在时间范围查看器中被选。

用户可以通过右击时间范围查看器区域查看命令菜单。


    星历图标

更多的信息

帮助 ...	对话框	又见
这些图标用来鉴别由接收机收到不同的卫星的广播星历的时间。对于测量过程中每一刻跟踪卫星星历的信息以下列时间记录：

  在测量开始时（如果卫星是可见的）

  当卫星第一次升过截止高度角

  每小时

缺省的，时间线第一次出现时这些图标的过滤器是关闭的。用户可以通过从时间线工具栏或从时间线查看区中可用的几个菜单中选择命令过滤这些图表。为了更多的信息，参见过滤时间线要素。

用户可以双击图标查看卫星星历属性对话框。此对话框包括卫星质量状况等的有用的信息。此信息对于了解观测的卫星数据质量的好坏很有帮助。

右击图标显示与星历有关的命令菜单。

星历图标不能被删除或禁用。由于星历图标与GPS观测有关系，GPS观测或所选的GPS观测区域可以被禁用，并从项目数据中删除所有有关的星历。为了更多的信息，参见禁用GPS观测。


    GPS观测

更多的信息

帮助 ...	对话框	又见
当打开一个或多个数据文件夹显示在一个测量时段过程中采集的数据，GPS观测要素仅显示在时间范围查看器中。

当打开一个数据文件夹时，对于GPS观测有用的每一颗卫星的图标就会出现，并且对于每一个图标，卫星跟踪区域的GPS测量就会出现在时间范围查看器中。

如下所示，形状和彩色代码表可用于时间线来区分不同类型的观测数据。

L1 P-Code   (绿色)	L1 Phase   (黑色)	Invalid Range	L1 Cycle    Slip	L1 C/A-Code       (红色)
L2 Full Phase (黑色)	L2 P-Code   (绿色)	L2 Cycle     Slip	L2 Encrypted       Code	L2 Half-Phase  (深黑色)
当评价GPS观测时，需考虑以下方面：

  对于单频观测，L1载波信号的卫星跟踪信息以连续的像素点显示在时间范围查看器中。

  对于双频观测，L1和L2的载波信号的卫星跟踪信息以两平行的连续像素点显示在时间范围查看器中。

  在跟踪区域间长的间距代表接收机未能跟踪卫星的周期。像素间短的间隔代表周跳和其他类型载波信号的丢失。

  周跳，不可用的测距数据以及其它的不真实的卫星信号来源，这些情况都以像素的形式标示出来。

假定每一个在卫星跟踪轨迹上的像素代表从一颗卫星瞬间采集的全部原始数据。这些原始数据包括：

  观测类型�相位，C/A码，P码， 等等

  可用的信号�真或假

  信号的状态�有效的，无效的，周跳

  启动/禁用状态--启动/禁用标记

这些像素像一个开关，有开和关状态。禁用此一个像素则与像素有关的原始卫星观测数据也被禁用。启用此像素则原始卫星观测数据也启用。这可使用户在编辑GPS观测数据时使用实验和误差逼近，用户可以禁用所选的数据，重新计算基线查看是否数据结果的质量有改进，如果结果证实不成功，重新启用数据。

通过选择小区域像素（例如，包括周跳的像素区域）。这些区域可以编辑用以改进全部的GPS观测质量。

提示：通过拖动有问题数据周围的选择框执行选择像素区域�简单的将鼠标指向所想禁用的区域的左上角，按下鼠标左键，拖动鼠标框住影响的区域。

禁用所选得像素的区域的数据，双击选择框显示GPS观测属性对话框。在其它的工具中，此对话框包括对于单独的卫星或所选的卫星的原始卫星数据禁用和启用的选项。若要获得更多的有关选择和编辑的信息，参见选择和编辑要素 。

当操作GPS观测属性对话框时，几个其它的工具是可用的。包括：

  禁用所选的多颗卫星的数据

  当采集卫星观测数据时编辑开始和结束时间。

  编辑GPS观测中包括的个别的观测类型

在控制栏用户可以通过禁用一个卫星图标删除所有的一测量的GPS观测的相关跟踪信息。对于下列情况这是有用的：与一颗卫星有关的全部卫星观测健康状况是差的，观测的卫星星群有足够的多余观测用以删除遗漏的禁用卫星。若要获得更多的有关的信息，参见禁用一颗卫星 。

提示：通过查看出现在卫星跟踪域中大多数星历图标的属性，用户可以获取对于所选卫星采集的GPS观测的健康状况。这些星历更新被接收机以一小时间隔破译并且包括一个信息显示当前每一颗卫星的健康状况。URA和URA Flag域也可用来评价全部的卫星广播的质量。

用户可以在GPS观测要素内右击任何区域查看对GPS观测数据操作的命令菜单 。

GPS观测不能删除，但是一个完整的GPS观测或或它的所选的区域可以删除。卫星可以通过禁用来停用所有的画在时间线上与GPS观测类型相关的内容。


    观测/数据时段要素

更多的信息

帮助 ...	对话框	又见
观测和数据时段代表了由接收机采集的GPS观测的时间范围，它们可以分为两类。

  静态观测，包括了快速静态和走走停停观测。它是接收机在一点固定不动观测一定的时间周期。

  连续观测，包括流动时段。连续或流动时段表示接收机在采集数据时是移动的。

彩色代码表

观测和数据时段范围通过彩色代码矩形显示采集的观测数据的时间范围。这些彩色代码和形状用于区分不同信息的类型。

  静态和快速静态观测以大的蓝色矩形表示。

  走走停停观测以小的蓝色矩形表示。

  连续时段观测以大的绿色矩形表示。

  流动观测以小的绿色矩形表示。

  有错误的时段以红色要素表示。

卫星星群区域

当选择了一个观测或连续时段，包括卫星星群的观测或时段时间信息的两区域可以显示。若要获得更多的有关的信息，参见下列主题。

  DOP Plot

  Skyplot

点线

点线代表GPS测量时可用的区域，但是对于这些测量却没有相关的观测或时段要素。

缺省的，流动时段不导入到数据库。它们仅能通过一连续时段转化为流动时段。当数据从一个DAT文件导入到TGO，对于所有的流动时段的使用检核对话框清除。

如果检核对话框清除，流动时段没有装载入项目中，并且点线用来表示对于这段时间可用的GPS测量，但是对于这些观测却没有相关的观测或时段要素。

如果选择了检核对话框，流动时段转化为连续时段，并且连续时段将显示在时间线上。获得流动时段的唯一方法是将连续时段转化为流动时段。

另外的帮助

当对观测和数据时段操作时，考虑下列帮助：

  观测和数据时段属性可以通过双击观测和数据时段查看。

  时间范围可以通过拖动矩形的左右边界直接调整。

  静态观测可以通过从观测/数据时段属性对话框中选择正确的类型转化为流动时段或连续时段

  观测和时段可以被删除。然而，一旦删除，就不可能从项目中访问它。

  下一个和上一个命令，在工具览用蓝色箭头图标表示，用于画出相对于下一个或上一个显示在当前激活的数据文件夹中的观测或时段的开始或结束点的时间范围查看器。


     卫星图标

更多的信息

帮助 ...	对话框	又见
卫星图标表示对于测量.起作用的GPS测量。在每一个图标上显示的卫星的PRN值用来辨识它们。

时间线第一次出现时，卫星图标是隐藏的。显示卫星，打开一个或多个控制栏中的数据文件夹。

符号表示文件夹打开
	卫星图标
控制栏的卫星图标与出现在时间范围查看器中的GPS观测是一一对应的。

任意右击这些图标查看命令菜单。使用启动/禁用命令来启动/禁用出现在时间范围查看器中的相关的GPS观测。此项功能通过禁用可用于删除某一观测的卫星信息，相应的卫星跟踪区域用彩色标出表示禁用的状态。第二次选择此命令重新启动跟踪信息。当卫星健康状况有问题时使用此命令。例如，用户可以禁用一颗所选的卫星确定是否处理结果有改进。

提释：用户可以禁用一个所选的GPS观测的区域。例如，用户可以禁用一个包括周跳或不可用相位数据的区域。若要获得更多的有关的信息，参见GPS观测.。

双击一个卫星图标查看SV Plot窗口，它有标绘从卫星采集的原始卫星跟踪信息的命令。SV Plot提供一个将原始卫星数据以表格形式导出到一个文件。

在一数据文件夹中的卫星图标可以通过拖动一图标到一新位置而重新排列。它是非常有用的当在编辑GPS观测属性之前选择几颗卫星时。


    静态观测

更多的信息

帮助 ...	对话框	又见
静态观测代表接收机在一个测站上保持固定时间。采集的数据可以识别确切的位置和数据采集的时间。

静态观测以大的蓝色矩形表示。矩形的长度代表数据采集的时间范围。一个测站图标出现在观测的第一条边上，代表观测是静态的。

双击静态观测查看它的属性。这些属性显示时段和天线信息。

用户可以右击静态观测要素内任意地方查看对观测数据操作的命令菜单。

静态观测要素可以调整以改变时间范围。静态观测可以改变为连续或流动时段通过在观测/数据时段属性对话框中的观测类型列表中选择正确的类型。

由于图形窗口和时间线是联系在一起的，在图形窗口中所选的点和基线的观测也将在时间线和vice versa中被选。例如，用户可以在时间线选择一个静态观测查看在图形窗口中所选的它的相关的点和基线。一旦选择了点或基线，用户可以查看它们的属性，获取有关观测的更多信息。

如果选择一个观测，带有有关卫星星群的观测或时段时间的信息的两块区域可以显示出来。若要获得更多的有关的信息，参见下列主题：

  DOP 图

  天空图

提示：从图形窗口获得的属性窗口对于通过时间线导航查找所选的观测是有用的。从此对话框中所选的基线和点的观测也被选在时间线。一旦被选，用户可以通过双击在时间线上的观测要素查看它的属性。

为了容易辨识，观测和时段要素显示以彩色的矩形显示。若要获得更多的有关的信息，参见观测彩色代码表 。


     测量要素

更多的信息

帮助 ...	对话框

时间范围查看器内部是一个或更多的矩形测量要素。这些测量要素与出现在控制栏的数据文件夹有关。每一个数据文件夹代表一个单独的接收机，它包括了一个或更多的测量。文件夹都是一些GPS测量的文件。

测量要素的第一条边定义了测量时段的开始时间，最尾部的边定义了测量时段的结束时间。如果控制栏中的数据文件夹包括了一个单独的测量要素，测量要素跨越了整条时间线的长度。因为很多观测几天的测量可以放入到一个项目中，一个典型的测量要素仅只占据整条时间线一小部分。

用户可以双击测量要素查看和编辑它的属性 。

用户可以在测量要素内右击任何地方查看对测量数据操作的菜单命令。

测量要素可以被删除。由于测量要素代表真实的数据，有关的数据将从项目中删除。当一条黑边包括了白色的矩形区域，删除出现在时间范围查看器中的测量要素。这些与可以让用户知道测量数据曾经位于此域中。


    时间线要素 - 概览

更多的信息

帮助 ...	又见
概览

时间线使用图形要素代表出现在时间范围查看器中GPS测量数据

	数据文件夹	测量	星历图标
	静态图标	观测	GPS观测
这些要素被选并且相关的数据属性可以编辑。如果适当，采集的数据的时间范围可以编辑，所选的卫星跟踪信息可以禁用，观测和测量要素可以删除。有关这些要素的执行的操作将影响它们项目中有关的数据。这些操作可以提高测量数据的质量，因为删除了影响全部的GPS观测质量的有问题的数据。

阅读要素工具提示

当鼠标指向时间线要素，下列的工具提示出现：

当鼠标指向 �	工具提示出现 �
一个测量要素	与要素有关的数据文件的名字
一个观测或数据时段要素	与观测有关的测站的名字
一个GPS观测	与跟踪信息有关的空间卫星数
一个星历图标	与星历更新有关的空间卫星数
一个卫星图标或数据文件夹	接收机的模式和序列号

若要获得更多的有关这些要素的信息，参见下列主题：

  测量

  观测

  测站图标

  GPS观测

  星历图标

  时间图标


    时间线工具栏

更多的信息

 又见

当时间线查看域出现是两个工具栏显示--时间线工具栏和规划区工具栏。这两个工具栏可以帮助用户快速的访问所用的时间线命令。

若要获得更多的有关时间线工具栏的信息，参见下列主题：

  时间线工具栏

  规划区工具栏


    时间线查看域 - 概览

更多的信息

帮助 ...	又见
概览

在导入一个或多个GPS测量文件到Trimble Geomatics Office软件项目后，时间线变为可用的。用户必须在测量查看中工作。

访问时间线：

1.	打开一个包括原始GPS数据文件的项目。

2.	做下列之一：

  选择 视图 / Timeline。

  按Alt+VI。

时间线查看域出现在图形窗口的底部。

时间线分为三个可视区域：

	时间标尺
控制栏	时间范围查看器
这三个区域内部是联系在一起的。时间标尺控制着时间范围查看器中与时间相关的测量信息的数量，控制栏控制着时间范围查看器中原始卫星信息的数量。

考虑到时间范围查看器作为放大镜，它可以查看全部的时间线或缩放或画出时间线的小的范围。时间线提供了缩放或画出时间范围查看器中出现的信息功能。由于时间线和图形窗口内部是联系在一起的，在图形窗口中选择的数据也将在时间范围查看器中被选。

当时间线激活时，发生下列两个变化：附加的工具栏变成可用的，状态栏显示时间线信息。

时间线查看域可以以纵向或横向模式打印。为了更多的信息，参见打印时间线查看域 。

若要获取有关时间线更多的信息，参见下列主题：

  工具栏

  时间标尺

  控制栏

  时间范围查看器

  时间线要素


     时间标尺

更多的信息

帮助 ...	对话框	又见
时间标尺和时间范围查看器内部连接在一起并且同时工作。任何的时间范围都可在两个窗口中反映。

考虑到时间标尺和时间范围查看器作为放大镜，用户可以缩放或画出在时间范围查看器所选的区域。时间线可以画出几小时到几天的时间并且包括很多观测。这两个窗口同时工作用来查看全部的时间线或小的周期。任何一个窗口小的变化将影响到另一个。

	开始时间域	结束时间域
	标尺
用户可以根据自己的需要编辑开始和结束时间域或缩放时间范围查看器。考虑下列操作：

  当用户需要检查一不知时间周期的观测数据时编辑开始和结束时间域来缩放时间范围查看器。例如，用户想要放大一个时间周期，在这期间，高的观测残差引起了基线解被拒绝。

  使用缩放到面板大小 命令放大一特殊的时间线要素。例如，需要放大一个连续的动态时段到时间范围查看器大小。

  当需要在时间范围查看器中查看全部的时间线时使用放大到最大 命令。如果几个数据文件包括在一个项目中并且需要将数据采集时的不同时间范围联系起来，此是非常有用的。

  使用放大 命令将时间范围查看器中数据放大两倍。如果用户需要放大GPS观测的一小部分查看卫星广播中的间断和周跳，此是有用的。

  使用缩小 命令将时间范围查看器中数据缩小一倍。使用此命令可以查看更多的GPS观测。它在试图确定卫星是否可用时非常有用�用户需要知道星群中是否有足够的多余观测可以禁用卫星。缩小命令可以使用户知道在时间范围内有多少颗卫星被跟踪。

  使用缩放到以前大小 命令缩放到以前大小。此命令可以将缩放后的观测或GPS观测变回到以前的大小

时间标尺可以显示下列两类时间单位：

  本地的Windows时间

  GPS周/秒

用户可以查看时间选项对话框来改变单位。如果容易将时间范围与每一天的时间周期联系就使用本地的Windows时间，例如日历或手表上的时间。如果需要将时间范围与GPS时间或数据联系就使用GPS周/秒。用户可以通过简单的点击鼠标在两种时间单位间切换。

改变时间单位将影响到所有的属性对话框和显示的内容。

用户可以右击时间标尺查看有关时间标尺的命令菜单 。

为了更多的信息，参见下列主题：

  工具栏

  控制栏

  时间范围查看器

  时间线要素

  时间线属性对话框

  时间线显示


     测站图标

更多的信息

帮助 ...	又见
使用这些小的红色三角形图标和标签用来定义静态观测。

注：测站图标不能被删除或禁用�它们仅能被它们的原始观测删除或禁用。


     时间图标

更多的信息

帮助 ...	又见
这些图标定义了发生在测量数据记录过程中系统产生的和人工生成的事件。事件图标仅仅出现在时间范围查看器中并且以菱形出现在事件发生的时间的中心。

事件图标可以通过单击 [image] 时间线工具栏过滤来显示或隐藏图标。


     时间线菜单 - 概览

更多的信息

概览

时间线菜单可使用户快速的访问时间查看域中的命令。当一个时间线元素或窗口被选中并单击右键，对应的菜单就会弹出。

下列菜单时可用的：

  时间标尺

  时间范围域

  数据文件夹

  GPS观测

  时间范围查看器

  测量

  观测

  卫星图标

  星历图标


     时间标尺菜单

更多的信息

 又见

使用此菜单快速的访问时间标尺命令。

访问它，做下列之一：

  双击时间标尺域

  右击时间标尺域

菜单出现，包括下列命令：

  时间选项

  放大到最大

  缩放到以前大小


     时间范围域菜单

更多的信息

 又见

使用此菜单快速的访问时间范围域命令。

访问它：

  右击开始和结束的时间范围域

菜单出现，包括下列命令：

  取消

  剪切

  拷贝

  粘贴

  删除

  全选


     控制栏菜单

更多的信息

 又见

使用此菜单快速的访问控制栏命令。访问此菜单可以查看时间线查看区域菜单。

访问它：

  右击控制栏任何的区域。

菜单出现，包括下列命令：

  展开所有

  压缩所有

  放大到最大

  缩放到以前大小


     卫星图标菜单

更多的信息

 又见

使用此菜单快速的访问卫星图标命令。

访问它：

  右击任何的卫星图标。

菜单出现，包括下列命令：

  启动和禁用

  SV 图


     时间范围查看器菜单

更多的信息

 又见

使用此菜单快速的访问时间范围查看器命令。

访问它：

  右击时间范围查看器。

菜单出现，包括下列命令：

  查看过滤器

  下一个

  上一个

  放大到最大

  缩放到以前大小


     测量菜单

更多的信息

 又见

使用此菜单快速的访问测量间隔命令。

访问它：

  右击测量要素。

菜单出现，包括下列命令：

  删除

  星历信息

  缩放到面板大小

  放大到最大

  缩放到以前大小

  属性


     静态观测菜单

更多的信息

 又见

使用此命令快速的访问静态观测命令。

注：访问此菜单，静态观测必须在时间范围查看器中是可视的。首先，查看时间线，然后，打开包括观测数据的数据文件夹。

访问它：

  右击静态观测要素。

菜单出现，包括下列命令：

  删除

  星历信息

  缩放到面板大小

  放大到最大

  缩放到以前大小

  属性


     GPS观测菜单

更多的信息

 又见

使用此菜单快速的访问GPS观测命令。

访问它：

  右击GPS观测要素或用矩形方框选中GPS观测。

菜单出现，包括下列命令：

  启动/禁用

  星历信息

  缩放到面板大小

  放大到最大

  缩放到以前大小

  属性


     星历菜单

更多的信息

 又见

使用此菜单快速的访问有关星历信息的命令。

访问它：

1.	如有必要，打开一个数据文件夹。

文件夹打开，显示卫星图标。

2.	如有必要，启动卫星过滤器。

GPS观测出现。

缺省的，卫星过滤器是启动的。

3.	如有必要，启动星历过滤器。

星历图标显示。

4.	右击所需的星历图标。

菜单出现，包括下列命令：

  缩放到面板大小

  放大到最大

  缩放到以前大小

  属性


     数据文件夹

更多的信息

帮助 ...	对话框	又见
一个数据文件夹代表了一个单独的接收机。接收机的类型和序列号显示在文件夹上。测量项目将有两个以上数据文件夹，每一个接收机对应一个文件夹。

每一个文件夹包括了一个或更多的测量信息。一个测量对应于一个单独的GPS测量文件。

打开和关闭数据文件夹来显示和隐藏控制栏的卫星图标以及有关的时间范围查看器中的GPS观测。

正号代表文件夹是关闭的
	接收机模型和序列号
负号代表文件夹是打开的

	卫星图标

用户可以使用两种方法打开和关闭数据文件夹：

  当文件夹关闭时，正号出现在文件夹的左边，当文件夹打开时，负号出现在文件夹的左边。用户可以单击正号和负号打开和关闭数据文件夹。

  Expand All 和 Shrink All 命令可以通过几种方式法访问用来打开和关闭所有的控制栏中的数据文件夹。

当打开时，对于每一颗对GPS观测的测量产生影响的卫星出现一个卫星图标，并且对于每一个卫星图标，代表卫星跟踪区域的GPS观测出现在时间范围查看器中。

  对于单频观测，L1载波信号的卫星跟踪信息以连续的像素点描绘在时间范围查看器中。

  对于双频观测，L1和L2载波信号的卫星跟踪信息以两条平行连续的像素点描绘在时间范围查看器中。

当用户单击一个数据文件夹时，显示出接收机属性 。右击一个数据文件夹时显示一个作用于文件夹中数据的命令菜单。

对于卫星图标可以执行几个操作并且打开一个数据文件夹时显示GPS观测。为了更好地说明显示在控制栏和时间范围查看器中的不同的时间线要素，参见时间线要素 。


     时间线控制栏

更多的信息

帮助 ...	对话框	又见
使用此控制栏管理显示在时间范围查看器中的GPS观测信息。

控制栏位于时间查看区的左下角。控制栏中执行的操作反映在时间范围查看器中。

用户可以从控制栏中执行下列操作：

  打开和关闭数据文件夹。

  启动和禁用卫星 图标和相应的GPS观测。

  查看接受机属性

  查看SV Plot 显示单独的卫星发送的原始跟踪信息。

使用控制栏菜单访问与当前时间线中查看的数据有关的命令。卫星图标菜单可用于启动和禁用于个别卫星有关的GPS观测，也可使用它启动SV Plot，带有画出与个别卫星有关的原始跟踪信息的选项。

为了获得更多的信息，参见下列主题：

  工具栏

  时间标尺

  时间范围查看器


     连续时段菜单

更多的信息

 又见

打开此菜单快速访问连续时段命令。

注：访问此菜单，连续时段在时间范围查看器中必须是可视的。首先，查看时间线，然后打开包括连续数据的数据文件夹。

访问它：

  右击连续测段 。

一菜单显示，包括下列命令：

  删除

  星历信息

  缩放到面板大小

  放大

  缩放回到以前大小

  属性


     时间线工具栏

更多的信息

 又见

此工具栏随着时间线出现而显示在工具栏区。

当时间线启动时此工具栏可以自动的显示。用户可以通过选择视图/工具栏/ Timeline隐藏工具栏，还可以通过重复此命令重新显示它。

这些按钮是可用的：

	选择此按钮过滤红色的三角形测站图标和与观测有联系的标签。测站出现在时间范围查看器的上边或一观测要素的开始点。当用户双击一个测站图标，测站的有关概述信息显示。
	选择此按钮过滤出现在时间范围查看器中的菱形事件图标。
	选择此按钮过滤连续的时段。这些时段是由流动接收机采集并且最初没有联测。单击此按钮隐藏时段，重击重新显示。
	选择此按钮过滤卫星采集的GPS观测值。单击此按钮一次隐藏所有的GPS观测值，重击重新显示它们。
	选择此按钮过滤出现在时间范围查看器中的星历图标。单击此按钮一次显示图标，重击隐藏它们。
	选择此按钮打开控制栏的所有关闭的数据文件夹。当用户单击此按钮时，卫星图标和数据文件夹中所有卫星的GPS观测值显示。
	选择此按钮关闭控制栏的所有打开的数据文件夹。用户单击此按钮时，卫星图标和每一个数据文件夹中所有卫星的GPS观测值隐藏。
	选择此按钮画出前面的测量要素的时间范围查看器。此按钮仅当选择了一个数据文件夹后才时可用的。用户每单击一次此按钮，前面的测量要素被选中。此按钮特别有用，它可以快速的查看一个测量到另一个测量而不需使用滚动栏。
	选择此按钮画出下一个的测量要素的时间范围查看器。此按钮仅当选择了一个数据文件夹后才时可用的。用户每单击一次此按钮，下一个的测量要素被选中。此按钮特别有用，它可以快速的查看一个测量到另一个测量而不需使用滚动栏。


     计划区工具栏

更多的信息

 又见

使用此工具栏执行显示的原始的卫星和广播星历信息的命令。

当时间线启动时此工具栏可以自动的显示。用户可以通过选择视图/工具栏/计划图隐藏工具栏，还可以通过重复此命令重新显示它。

这些按钮是可用的：

	选择此按钮查看DOP图。此按钮仅当选择了一个观测后才时可用的。
	选择此按钮查看观测的天空图。此按钮仅当选择了一个观测后才时可用的。
	选择此按钮查看所选卫星的SV图。此按钮仅当选择了一个观测后才时可用的。


     时间范围编辑域

更多的信息

帮助 ...	又见
使用时间标尺上的开始和结束时间域画出所选的时间范围查看器。

如果用户需要检查以及时间周期的观测数据，编辑开始和结束时间域画出时间范围查看器。例如，用户可能想要画出一指定的位于时间线上测站的时间范围。

当编辑这些域时，用户可以右击这些域显示一个菜单，使用剪贴板命令：剪贴、复制、粘贴和取消。


     卫星星群图 - 概览

更多信息

帮助 ...	又见
概览

时间线用卫星星群信息产生图形显示。这些显示基于观测时刻当前的星历信息。

包括：

  DOP 图

  天空图

当选择观测要素时，仅可获得这些显示。需要观测值来获得所计算的可视卫星的点的坐标。


     DOP图

更多信息

帮助 ...	又见
使用这个显示卫星的个数和精度衰减因子 (DOP)，GPS定位的期望质量的测量基于观测范围上的卫星的几何图形。用于得到该显示的信息基于观测时刻当前的星历信息。

查看观测值的DOP图，做下列之一：

  在Timeline中右击观测值选择星历信息 / DOP图。

  从计划图工具栏，单击 [image] 。

显示DOP 图。

DOP是卫星星群几何图形质量的数量测量。较小的DOP值表示较强的几何图形结构，较大的值表示较弱的几何图形结构。通常，当较多卫星可见时，DOP值较小，几何图形结构较强。Number of Satellites Plot显示关于观测范围的可见卫星的个数。

白天的时间和位置影响DOP。由于使用计划软件可预计较小DOP和好的卫星几何图形结构的时间，当条件大多数有利时，可能确定白天的观测时间。

注：卫星的个数和DOP计算仅仅基于观测时刻当前的星历。显示不需要反映实际跟踪条件，例如可以显示比实际跟踪的多的卫星。可能由于测点处的障碍，当产生这些显示时，不予考虑。


Skyplot
     天空图

更多信息

帮助 ...	又见
使用该显示查看所选择位置的可见卫星星群的当地二维（平面）图。用于得自天空图的信息基于观测时刻当前的星历信息。

查看天空图显示，做下列之一：

  在时间线中右击观测要素，选择星历信息 / DOP图。

  工具栏单击 [image] 。

在天空图中当地的平面根据方位角和高程来显示。

在状态栏中移动鼠标指针穿过图查看卫星跟踪数据。状态栏识别卫星和显示最靠近鼠标指针的数据点的时间，方位角和高程。

在开始观测时，最初的卫星星群用围绕数据点的小块正方形来突出。对于这些时间点，显示卫星的个数和DOP。用户可以更新这些数据。

注：天空图仅仅基于观测时刻当前的星历。显示不需要反映实际跟踪条件，例如可以显示比实际跟踪的多的卫星。可能由于测点处的障碍，当产生天空图时，不予考虑。


     时间线内容

内容

可使用下列帮助主题：

学习如何使用时间线，查看下列主题：

  何时和为何使用时间线

  时间线视窗区域

  时间线要素

  时间线数据属性对话框

  时间线菜单

  时间线命令

  时间线卫星和星历显示

需要帮助，按F1。


时间线 - 概览
    时间线 - 概述

更多信息

对话框	又见
概述

时间线以图形，基于时间的格式显示GPS工程信息（例如Trimble接收机或数据采集器采集的原始卫星和测量信息）。在时间线中用适当位置的图形要素表示每条信息。时间线仅在测量视窗中可使用。

查看：

  选择视窗/时间线。

使用时间线：

  查看卫星观测值的详细图表

  停用所选的卫星数据

  选择编辑伪GPS观测数据

  编辑与要素相关的数据属性

  调整用于基线处理的观测次数

一旦出现时间线，用户能选择图形要素检查，检验，和编辑与那些要素相关的数据。

为了获得更多的信息，读这些主题：

  何时和为何使用时间线

  时间线视窗区域

  时间线要素

  时间线数据属性对话框

  时间线卫星和星历显示


     何时和为何使用时间线

更多信息

帮助 ...	对话框	又见
使用时间线检查，检验，和编辑GPS工程信息。把GPS原始数据文件传输到用户的Trimble Geomatics Office软件工程后，用户能使用时间线。如果用户在处理基线前想要检查采集在文件中的GPS数据，或编辑天线信息，使用时间线检查数据。如果处理产生未预料到的结果，时间线在基线处理后最有用。用户能使用时间线发现有问题的数据并且编辑数据改进它的质量。

使用时间线检查适合于这些条件的GPS测量信息：

  卫星信号周跳和其它信号问题

  卫星健康状况不好

  卫星星群没有足够的多余观测

  较差DOP（精度衰减因子）周期

  天线测量问题

  多重测量数据文件中的适时问题

使用时间线进行试错法检验：

  调整数据采集时间范围

  停用和启用卫星跟踪信息

使用这些时间线操作改进数据质量：

  调整观测次数

  停用不健康的卫星改进全部多余的观测值

  选择编辑伪GPS观测数据

  从基线处理中删除有问题的观测值

  从基线处理中删除有问题的测量数据

在数据文件夹中时间线保持所有从单一接收机获得的GPS测量文件。它也显示使用测量要素的每个GPS测量文件的信息。每台接收机有它自己的，单独的数据文件夹，和显示在来自同一接收机的单独一行的所有测量要素。

显示记录数据的时间范围的测量要素。能打开每台接收机的数据文件夹显示附加的信息，这样表示测量期间采集的所有数据。

通过时间范围阅读器使用鼠标操纵，然后选择要素查看或编辑它们的数据属性。能使用时间线卫星信息和星历显示较详细地查看或编辑数据。

当使用时间线时，用户仍然能在图形窗口中工作。两个视窗链接在一起棗出现在一个视窗区域的数据选择和改变在另一个区域里被选择。学习如何一起使用两个视窗，参见选择和编辑时间线要素。

错误！未定义书签。


     选择和编辑时间线要素

更多信息

帮助 ...	对话框	又见
因为图形窗口和时间线是链接在一起的，用户能进行这些操作：

  选择时间线观测要素和查看图形窗口中所选的点。

  在图形窗口中选择基线和查看弥补时间线中加亮的基线的观测时段。

  在图形窗口中选择一个点和查看时间线中相关的加亮的时段。

注：如果启用相关基线视窗，仅仅显示在时间线视窗中的观测值被显示在图形窗口中。对于选择独立基线这是一个有用的工具。启用相关基线视窗：

1.	选择视窗/过滤器。显示视窗过滤器对话框。

2.	选择使用时间线显示相关GPS基线选项并且单击确认。

使用计划编制图表工具栏显示这些详细的图表和曲线图：

  测站观测的DOP和SV图表的数量

  测站观测的卫星的Skyplot

  一个时段的原始卫星跟踪信号图表

使用这些图表和曲线图：

  改变所显示数据的时间范围

  同时打开多个显示查看不同格式的信息

  调整大小和重新排列窗口检查数据

  打印图表和曲线图

在下列部分描述图表和曲线图。

要素选择

与选择时间线要素或它们的相应的工程数据相关的五种操作：

  单击要素选择与要素相关的数据

  双击要素查看它的信息属性

  右击要素查看用要素工作的命令的菜单

  在查看它们的属性或停用或删除与要素相关的数据之前，拖拉选择一个或多个要素周围的矩形。

  使用单击Shift键或单击Ctrl键操作选择随机的要素选项

选择一个要素与选择与要素相关的工程数据相同。

取消操作

能使用Trimble Geomatics Office软件取消命令取消一些时间线操作，例如删除和停用要素。当停用或删除时间线要素时，它的原始的要素状态放置在剪贴板。选择取消命令恢复删除或停用操作。

注：如果另一个命令把数据写在剪贴板上，不能取消删除或停用操作。

当编辑开始和结束时间区域命令时，取消命令也可使用。用户能从一个区域剪切或复制文本并且把它粘贴在其它上面。

读要素工具提示

当鼠标指针放在时间线要素上时，显示这些提示。

当指针放在�	工具提示显示
测量要素	与要素相关的数据文件的名称
观测值或数据时段要素	与观测值相关的测站的名称
GPS观测值	与跟踪信息相关的空间运载工具数量
星历图标	与星历更新相关的空间运载工具数量
卫星图标或数据文件夹	接收机模式和序列号


     编辑卫星跟踪信息

更多信息

帮助 ...	对话框	又见
使用GPS观测值属性对话框编辑卫星观测值的范围和使用这些编辑基线处理。用户能编辑一个或多个卫星的卫星信号的不同观测值类型。例如，用户停用一颗或多颗卫星的加密的L2观测值。


时间线命令 - 概览
     时间线命令 - 概述

概述

使用四种方法中的一种或多种方法执行不同的时间线命令：

  双击时间线区域和要素

  右击时间线区域和要素显示一个菜单并且选择一个命令选项

  单击工具栏按钮

  按键顺序

并非所有命令可以支持所有四种方法。

这些命令可使用：

  连续的

  复制

  剪切

  删除

  DOP图表

  启用/停用

  星历

  星历信息

  事件

  扩大所有的

  粘贴

  属性

  卫星

  选择所有的

  缩小所有的

  Skyplot

  SV图表

  时间线

  时间选项

  取消

  查看过滤器

  放大

  缩小

  放大程度

  放大以前的

  放大范围

在SV图表中可使用其它命令。


时间线属性对话框 - 概览
    时间线属性对话框 - 概述

更多信息

帮助 ...	对话框	又见

概述

在时间线中使用属性对话框进行大多数测量数据的编辑。但是，一些时间线区域，例如观测值和时段的开始和结束时间区域，能使用时间标尺和从属性对话框来编辑。使用鼠标停用和删除数据的时间线命令也提供编辑数据的选择方法。

以两种方式访问属性对话框：

  双击要素。

  右击要素和选择属性。

时间线属性对话框保持打开直到单击确认或取消。直到单击确认才保存数据中的变化。能立刻打开多个属性对话框，允许用户比较不同的要素属性。例如，用户能同时查看两个或多个观测值的属性对话框。

可使用这些属性对话框：

  接收机属性

  测量属性

  观测值/数据时段属性

  GPS属性

  星历属性

注：卫星图标没有属性对话框，但是用户能查看SV图表绘图，打印，和输出采集的用于测量的每颗卫星的数据的原始跟踪信息。当GPS观测值中发现广播的间隔时，这些图表用于检查原始卫星跟踪信息。


时间线显示 - 概览
     时间线显示 - 概述

更多信息

帮助 ...	又见
概述

时间线包括用于查看测量期间采集的卫星跟踪和星历信息的更详细信息的附加显示。这些显示能用作进一步检查所采集的观测值的数据和单颗卫星所采集的GPS观测值的工具。

可使用这些附加的显示：

  卫星观测值显示

  星历信息显示

分析绘于每个显示中的信息的帮助包括在以上主题中。使用这些帮助进行更全面的数据分析。


     基线解

更多信息

 又见

五种可能的基线解描述如下：

  浮动解

  固定解

  宽巷固定解

  窄巷固定解

  无电离层影响的解


     浮动解

更多信息

 又见

当基线处理器不能计算确定的模糊度的整周数值时，获得浮动解。通常在基线处理期间，模糊度计算得一个值如1000.60。该值不接近整周值，难以确定数值是否应该设置成1000或1001。因此，处理器不能设置出最接近整周值的数值。使用模糊度作为真值计算基线成分。该基线解不如固定解那么精确。

浮动解是没有模型的大气，轨道，以及其它误差的结果。


     固定解

更多信息

 又见

当处理器能找到一套优于所有其它可能的整周模糊度数值时，获得固定解。基线处理器给整周数设置模糊度数值计算最终的基线成分。在实际测量中，有一个显示固定整周解的好的参考操作模式。

对于单频接收机，最佳解通常为双差固定整周解。对于双频接收机，可能用多种方式结合载波相位观测值产生几个不同的固定解。


     宽巷固定解

更多信息

 又见

宽巷涉及不同方程式中L1和L2 载波相位观测的组合的方法。载波相位观测之差(L1−L2)产生宽巷载波相位。宽巷的有效波长为86.2厘米。

利用观测值的组合很容易找到整周模糊度。因此，在大多数情况下，解算长基线时使用宽巷。


     窄巷固定解

更多信息

 又见

窄巷涉及不同方程式中L1 和L2 载波相位观测的组合的方法。载波相位观测相加(L1+L2)产生窄巷载波相位。窄巷的有效波长为10.7厘米。窄巷在消除电离层对GPS测量观测值的影响方面非常有效。


     无电离层影响的解

更多信息

 又见

无电离层影响的解利用L1和L2 载波相位 的组合消除电离层对GPS信号的影响。解的类型通常用于高等级的控制测量，特别是观测长基线时。


     信号强度

卫星的信号强度也称信噪比 (SNR)，是对信号噪声的信号信息内容的测量。随着比例的减少，信号淹没在噪声中。信号质量随着信号水平的增强而改进（信号水平14优于信号水平8）。卫星在30�的典型的L1信号水平是从12到20。大于20的L1值最好。如果星座中的卫星的L1信号水平低于6，数据质量较差，低信号水平给出适合于导航而不适合于测量的位置。已知L2的SNR通常低于L1的SNR。关注L1的信号强度估定数据噪声。

GPS卫星信号相对较弱。实际上，大多数情况下，不断出现的背景噪声高于GPS信号。当卫星的信号强度特别弱时，从这些观测值计算的位置往往是不精确的。

有两种弱信号的普遍原因。第一，如果信号穿过障碍物例如树冠到达天线，通常变弱。安置的接收机能使树冠的消弱影响减小到最小，以便于天空的清晰可见。第二，低于水平面的卫星信号通常弱于直接在头顶的卫星。

使用低高度卫星也能导致多路径误差（反射的GPS信号引起的误差）。为了避免低高度卫星的不利影响，坚持在建议的高度截止角以上测量。大多数后处理的测量和实时测量都在13°的截止角进行。当卫星低于10°时，很少记录卫星数据。


     精度衰减因子(DOP)

精度衰减因子(DOP)是位置质量的指示器。它是考虑每颗卫星相对于星座（几何位置）中其它卫星的位置来预计用该星座能得到的位置精度的计算结果。小的DOP值表示强的卫星几何位置和精度的较高概率。高的DOP值表示弱的卫星几何位置和精度的较低概率。

DOP值的通常计算类型如下列出。

  相对的(RDOP) − 相对位置误差

  位置(PDOP) − 水平和高程观测值（纬度，经度，高度）

  水平的(HDOP) − 水平观测值（纬度，经度）

  垂直的(VDOP) − 高程观测值（高度）

  时间(TDOP) − 钟差

PDOP是星座精度的最佳指示器，虽然PDOP不单独确定好的基线。小于等于4的PDOP产生最佳位置。5到7之间的PDOP可接受，大于等于7的PDOP较差。也能在接收机上设置PDOP截止值略去PDOP高于指定的限制值的星座。在Trimble测量接收机中默认的PDOP截止值为7。注意该截止值仅仅影响定位，对随后的基线处理没有大的影响。

快速计划程序可计算区域观测期间的PDOP。通过输入位置和重要数据，预报可见的卫星和几何位置。


基线处理记录 - 概览
     基线处理记录 - 概述

概述

当分析基线解时，基线处理器产生一个具有可使用信息的记录文件。

文件命名为处理记录.html，位于每个工程中都能找到的报告\基线文件夹中。文件处理记录.html能使用HTML阅读器或web浏览器查看。

该文件产生于每个GPS处理时段。如果不重命名以前的文件，那么每次开始新的处理时段时都重写它。基线处理器适用该文件记录影响处理结果的警告和误差。

如果处理过程中任何警告或误差都记录到该文件中，当完成处理允许访问基于误差报告的工程属性/常规的标签的该文件的内容时，显示一个对话框。下列误差或警告的一个或多个可能出现在该文件中：

误差

  未解基线

基线<起点名称> -> <终点名称>未解

  处理时段没有足够的OTF处理数据

处理时段(<GPS周> <GPS周秒>)没有足够的OTF处理数据。时段长度= <持续时间>

  动态时段初始化

动态时段初始化失败。时段：<GPS周><GPS周秒> -> <GPS周> <GPS周秒>

  固定基线初始化失败

固定基线初始化失败

  静态基线初始化失败

静态基线初始化失败

  动态解失败

  <文件名>动态解失败。开始：<GPS周> <GPS周秒>    结束: <GPS周> <GPS周秒>

  走走停停解失败

<点名>走走停停解失败。

警告

可能遇到下列警告：

  基线有两个解

<BaselineId>该时段基线有两个解。仅仅保存一个。<BaselineId>

  难以获得精密星历

使用广播难以获得<起点名称> -> <终点名称> <GPS周> <GPS周秒>的精密星历


     不保存基线

误差有下列格式：

基线<起点名称> -> <终点名称>不保存<起点>和<终点>是工程的点名能用于识别基线。

当误差产生时，一个基线期望的解将从GPS处理列表中丢失。


     处理时段没有足够的OTF处理数据

误差有下列格式：

处理时段(<GPS周> <GPS周秒>)没有足够的OTF处理数据。时段长度= <持续时间>

<GPS周>和<GPS周秒>是OTF处理失败时段的开始时间。该时间能用于使用时间线查看值得怀疑的GPS观测值。

<持续时间>是OTF处理失败的GPS观测值横跨的时间总数。

当该误差产生时，基线处理器不能进行OTF初始化，可能导致一个或多个动态基线解的失败。这可能导致一个或多个期望的基线解从GPS处理列表中丢失。


     动态时段初始化失败

误差有下列格式：

动态时段初始化失败。时段：<GPS周> <GPS周秒> -> <GPS周> <GPS周秒>

<GPS周>和<GPS周秒>是动态初始化失败时段的开始和结束时间。这些时间能用于使用时间线查看值得怀疑的GPS观测值。

当该误差产生时，基线处理器不能进行动态初始化，可能导致一个或多个动态基线解的失败。这可能导致一个或多个期望的基线解从GPS处理列表中丢失。


     固定基线初始化失败

误差有下列格式：

已知点初始化失败

当该误差产生时，基线处理器不能从已知点进行动态初始化，可能导致一个或多个动态基线解的失败。这可能导致一个或多个期望的基线解从GPS处理列表中丢失。


     静态基线初始化失败

误差有下列格式：

静态基线初始化失败

当该误差产生时，基线处理器不能从静态观测值进行动态初始化，可能导致一个或多个动态基线解的失败。这可能导致一个或多个期望的基线解从GPS处理列表中丢失。


     动态解失败

误差有下列格式：

<文件名>动态解失败。开始：<GPS周> <GPS周秒>    结束：<GPS周> <GPS周秒>

<文件名>是用于动态解的GPS观测值的文件的名称。

<GPS周>和<GPS周秒>是动态解失败时段的开始和结束时间。这些时间能用于使用时间线查看值得怀疑的GPS观测值。

当该误差产生时，一个期望的该基线的解将从GPS处理列表中丢失。


     走走停停解失败

误差有下列格式：

<点名>走走停停解失败

<点名>是走走停停解失败的点的名称。

当该误差产生时，一个期望的该基线的解将从GPS处理列表中丢失。


     基线有两个解

警告有下列格式：

<BaselineId>该时段基线有两个解。仅仅保存一个。<BaselineId>

<BaselineId>是用于工程中的基线的观测值标识符。<BaselineId>

当周跳把走走停停动态观测值分开时，出现警告。如果每部分是两个或多个历元，基线处理器将在周跳的每边产生解好像该点有两个观测值。

如果选择覆盖原有基线解检核复选框，仅仅保存一个解。缺省的，保存最后一个解。但是，可通过选择需要保存的基线解的复选框，和清除不需要保存的复选框来改变。

两个解的同一基线ID可识别两个基线解。


     难以获得精密星历

警告有下列格式：

使用广播难以获得<起点名称> -> <终点名称> <GPS周> <GPS周秒>精密星历

<起点>和<终点>用工程中的实际点名代替并且用于识别基线。

<GPS周>和<GPS周秒>用难以获得精密星历的基线的开始时间代替。检查包含保证适当覆盖的精密星历文件的工程文件夹。

该警告显示精密星历处理是必须的，但会得到精度不够的星历数据。当这种情况出现时，用广播星历代替使用。