Copyright: ?1999-2002 Trimble Navigation Limited. All rights reserved.
Citation: �11999-2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office - 概述

Trimble Geomatics Office可以使多种测量技术获得的数据一体化，包括GPS(RTK和后处理)，常规/光学仪器 (包括伺服系统和遥控设备)，水准仪和激光仪。 广泛的质量控制工具可以快速并且高效地完成从野外到办公室，再从办公室回到野外的无缝数据传输任务。

使用Trimble Geomatics Office可以:

  GPS基线的处理(如果安装了WAVE基线处理模块)

  测量网络平差(如果安装了网平差模块)

  GPS和常规的地形测量数据处理

  数据的质量保证和质量控制(QA/QC)

  道路设计数据导入和导出

  测量数据导入和导出

  数字地面模型和等高线

  数据转化和投影

  GIS数据获取和导出

  要素代码

  项目报告

  测量项目管理

关键要素

下列是 Trimble Geomatics Office (版本 1.6) 的关键特征：

  在图形窗口中以视图方式显示测量和计划数据

  在主图形窗口中，项目工具条使用多任务并将作为快捷方式

  查看过滤器，允许显示或隐蔽某类观测值

  拖放功能，可将桌面上的任何工作文件拖放到项目区

  导入 GPS 接收机或常规全站仪所采集的数据

  广泛的导入导出格式

  数据检查对话框，可在原始GPS数据导入前进行检查编辑

  属性窗口，可查看并编辑点的所有相关信息以及观测类型

  多编辑对话框，可快速编辑多个实体

  GIS数据采集支持

  管理CAD数据的图层支持

  专业的现场的HTML报告

  标准和特定的报告格式

  为查看并编辑第三方道路设计、数字地面模型的 RoadLink 和 DTMLink 模块

注: Trimble Geomatics Office 不支持 8.3 文件名系统。

模块

下列描述了Trimble Geomatics Office可用的可选模块:

  WAVE基线处理模块，利用静态、快速静态或动态数据采集程序产生的GPS野外观测值进行基线计算。WAVE基线处理提供默认处理，也可进行高级处理，并可灵活控制。Timeline以图形、时间为基础格式显示原始观测文件中的GPS数据。使用它查看并编辑GPS原始观测值和测量信息。

  网平差模块，GPS和地面测量数据的平差，以估计并减少内部的错误。

地球数学是什么？

地球数学是设计，收集，存储，分析，显示，和恢复空间的信息。空间信息的收集可以从多种来源,包括 GPS 和陆地的方法。地球数学集成传统型与新型测量技术的快速发展,为应用地球数学提供了一个广阔前景。


卸载软件

警告: 此操作将卸载并删除，除普通文件、模板、数据文件外的所有文件。 删除数据文件请使用Microsoft Windows资源管理器。

从计算机中卸载Trimble Geomatics Office：

1.	选择开始/设置/控制面板。

2.	从控制面板，选择增加/删除程序。增加/删除程序属性对话框出现。

3.	确定激活了安装/卸载标签。

4.	选择Trimble Geomatics Office。

5.	点击添加/删除。确定出现文件删除消息框。

6.	点击是。

文件被删除。

警告: 如果您卸载 Trimble Geomatics Office ，您将丢失所有的已设定的格式。例如, 如果您把符号类型加到了系统产生的符号库( Symbols.sym )或增加特定的导入/导出格式，一旦删除，这些都将丢失。

下列文件包含了定制信息：

  计划表格定义文件(*.frm)�当用文本编辑器编辑时定制

  报告格式文件(Asciirpt.dat) �创建自定义文件时定制

  ASCII导入定义文件(Asciiimp.dat) �创建自定义导入格式时定制

  ASCII导出定义文件(Asciiexp.dat) �创建自定义导出格式时定制

  系统产生的符号库(Symbols.sym) �在向文件中保存新符号类型时定制

  系统产生的线状库(Linetype.ltp) �在向文件中保存新线型时定制


文件夹结构

在安装期间的, 所有的Trimble Geomatics Office必须的文件被拷贝进下面列出的文件夹:

文件夹	存储内容
\Program Files\Trimble\ Trimble Geomatics Office	Trimble Geomatics Office 程序和帮助文件
...\System	系统文件; 包括要素和属性库文件，Symbol Editor� 和 Line Type Editor�以及HTML报告模板
...\Template	项目模板文件
...\Utility	与A1 Viewer, Convert to RINEX�, Coordinate System Manager�, Data Transfer, DC File Editor�, Feature 和 Attribute Editor�, Line Type Editor, Planning, 以及Symbol Editor功能链接
...\RoadLink � DTMLink	RoadLink a和 DTMLink 使用的程序文件和相关文件
\Program Files\Common燜iles\ Trimble	被Trimble Geomatics Office和其它Trimble 产品使用的文件
...\GeoData	坐标系统信息和大地水准面文件
...\GeoDB	坐标系统管理程序文件
...\Data Transfer	数据传输程序文件
...\DatToRinex	转化为RINEX 程序文件
...\Dceditor	DC文件编辑程序文件
...\Plan	规划程序文件


关于 Trimble

Trimble是全球定位系统GPS技术的先导。除了提供先进的GPS组建，Trimble把GPS与其它定位技术以及无线通信和软件技术相结合，开发了一套全面的客户解决方案。Trimble产品的应用领域包括测量、车辆导航、机器导引、资产跟踪、无线平台和电信业的基础设施。

Trimble 总部办公室位于Sunnyvale玛丽大街645号。我们同时拥有遍布全球的办事处为您服务。为了交互查看Trimble,可以在万维网上访问我们的站点：

www.trimble.com


反算值命令

用此命令确定两个项目的点之间的反算值。

要访问它，选择测量/反算值。

反算值对话框出现。


反算值对话框

使用此对话框确定两个项目间点的反算值。可用此对话框浏览反算值的简要或详细信息，并产生一个报告。

要访问它，采取以下方法之一：

  选择测量/反算值。

  按F7。

注： 反算值工具只用于已存在的点。要浏览与其它坐标位置之间的方位角和距离，使用观测工具。访问时选择测量/观测。

起始

从键盘输入点名称或用填充域点击一个点。

到达

从键盘输入点名称或用填充域点击一个点。

将指针移向另一点时，出现一条虚线。它显示要计算的反算值。在第二点上点击时，虚线变为实线。它显示了反算值信息所指的线。

如果项目属性对话框的单位和格式标签中的显示距离设置被设为网格或海水面距离，并且这两个点不带有高程，则网格距离和方位角将被显示出来。但是，如果作为域的显示距离被设为地面距离，两个反算值点都没有高程，则距离显示为空（如果缺省高程设置为空）。如果没有任何高程信息，就不能计算地面距离。

网格方位角

此域显示点之间的网格方位角。

网格距离

此域显示点之间的网格距离。

高程差

两点都有高程时，显示高程差。如果任一高程未知，此域都显示为空。

方法

有两种计算反算值的方法：

连续的	一个接一个地计算反算值序列。

放射性的	从一个共同的起点放射性地计算反算值序列。

计算

如果用键盘输入所选点，则点击计算来计算反算值。

发至报告

点击发至报告，创建反算值计算的报告。反算值的简要或详细报告会根据反算值的显示选项而产生。

注：如果报告由一个显示选项产生，然后又以其它显示模式再次产生，则此报告的反算值信息被附加到已有的报告。

显示报告

点击显示报告，浏览创建的反算值报告。

简要报告在反算值对话框以简单的模式显示反算值信息。

详细报告显示网格、地方（测量）和笛卡尔 (WGS-84) 坐标系统中的“起始”和“到达”点的位置，以及计算出的反算值和用于在坐标系统中归算反算值的参数。

详细信息 / 简要信息

点击详细，显示详细信息组。显示详细信息组时，按钮变为简要。 点击简要，隐藏详细信息组。

详细信息

详细信息组显示反算值的附加信息。

NS 前进方位角

此域显示第一点到第二点的法截面向前的（测量）方位角。

NS 反向方位角

此域显示第二点到第一点的法截面向后的（测量）方位角。

椭球距离

此域显示点之间的椭球距离。

地面距离

此域显示点之间的地面距离。

高度差

此域显示点之间的高度差。


观测命令

使用此命令观测任何图形窗口的方位角、距离和面积。

要访问它，选择测量/观测。

观测对话框出现。


观测对话框

用此对话框观测任何图形窗口的方位角、距离和面积。

要访问它，选择测量/观测。

您可以观测项目点或屏幕上的位置。（在相应位置点击。）

一旦选择了两个或更多的定位值，距离域将显示第一个和最后一个位置之间的累积距离。方位角域显示最后选择的位置之间的方位角。

提示： 如果点击并拖动鼠标，域将显示当前方位角、与第一点之间的累积距离及覆盖的面积。

方位角

选择两个位置后，显示点之间的网格方位角。如果选择三个或更多的点，此域显示最后两点之间的方位角。

距离

选择了两个位置后，点之间的距离就被显示出来。如果选择三个或更多的点，此域将显示观测到的累积总距离。

根据显示设置来报告总的距离。

注： 如果项目属性对话框中的显示距离为域被设置为地面距离，并且两个观测点都没有高程，则距离显示为空（如果缺省高程设置为空）。如果没有任何高程信息，软件就不能计算地面距离。

面积

选择三个或更多的点后，显示返回第一点形成的图形的面积。

计算的面积根据距离显示设置的不同而不同：

  地面距离设置给出用平均地面高程计算出的面积。

  海平面距离设置给出在椭球表面计算出的面积。

  网格距离设备给出由网格坐标计算出的面积。

重设

点击重设，消除所有域。也可在起始点双击来进行重设。

提示： 通过浏览图形窗口状态条的标尺 [image] ，可以快速地确定图形窗口显示的项目范围。要浏览此标尺，将光标移至图形窗口之外。

在使用指针  [image] 时，按 Ctrl。 这可防止它吸附到附近的点。


坐标转换 - 概述

更多信息

如何做 ...	对话框	也请参见
概述

坐标转换移动项目中的点。它包括二维的移动、旋转和缩放。控制或平差点不能被移动。如选择移动的点是平差或控制点，将会出现提示信息。

如果项目中的点是从假定了坐标系统的第三方设计软件包而来，需要将点进行转换获得正确坐标时，可以使用坐标转换。

要定义坐标转换，有以下几种方法：

  使用填充域，在点上点击，然后输入已知的坐标值。如果使用的点超过三个，软件使用最小二乘法计算所选点的转换参数。

  指定转换参数。

进行坐标转换时，到点的所有其它观测值都无效。显示的已转换点的网格、地方和WGS-84坐标都被改变，但坐标系统不变。

一旦进行了坐标转换，就可以创建一个报告来显示原坐标值和转换后的坐标值。


坐标转换命令

使用此命令确定和应用水平方向的转换。

要访问它，选择测量/坐标转换。

坐标转换对话框出现。


坐标转换对话框

 概述及更多信息

使用此对话框确定和应用水平方向的坐标转换。

要访问它，选择测量/坐标转换。

要在此对话框中输入数值，有以下几种方法：

 点击点列表，从已知坐标并输入了值的项目中选择点。软件计算转换参数。如果点的值数超过三个，就使用最小二乘法。点列表中显示的统计结果可帮助您估计是否已经正确地把点加到了列表上。坐标转换对话框显示出转换值。

 从键盘输入值。

进行坐标转换时，到点的所有其它观测值都无效。显示的已转换点的网格、地方和WGS-84坐标被改变，但坐标系统不变。

东西平移量

显示向东（正）或向西（负）平移的量。

南北平移量

显示向北（正）或向南（负）平移的量。

旋转

显示转换中要应用的角度旋转量。

比例

显示转换的比例改变量。

旋转原点

下列域显示旋转中心的位置。

点	显示要作为旋转原点使用的点名。如果输入点名，坐标会显示在纵域和横域中。如果点列表用于计算参数，此域显示来自点列表的平均坐标。
纵	显示原点的纵坐标。
横	显示原点的横坐标。
转换

要转换点，从下列选项中选择一个：

选择	将转换应用到所选点。
整个数据库	将转换应用到项目中所有的点。
未选择点时，这些选项按钮无效，所有点都被转换。

建立坐标转换报告

选择此校验框创建原坐标和转换后坐标的报告。报告出现在缺省的HTML浏览器中。

点列表

点击点列表，选择控制点。输入点的已知值。

点列表对话框出现。


坐标转换 - 点列表对话框

 概述及更多信息

使用坐标转换-点列表对话框选择用于计算坐标转换参数的点。选择了点后，Trimble Geomatics Office显示当前坐标，这时可输入已知坐标。Trimble Geomatics Office计算转换参数，然后将转换应用到所选的点。

要访问它：

1.	选择测量 / 坐标转换。坐标转换对话框出现。

2.	点击点列表。

该对话框显示一个滚动列点。每个点都有显示当前坐标的域和显示已知坐标的域。输入点名称，出现当前纵坐标和当前横坐标域。然后在已知的纵横坐标域中输入坐标。

提示： 可保持点名称为空，用填充域输入当前坐标。

用于计算坐标转换的定位值数目的定义没有限制。添加很多定位值定义不会改善计算的转换结果，但可进一步检查计算出的参数的有效性。

统计

统计组显示比例尺和最大水平残差。使用这些数字可检查是否输入了不正确的值。

插入

点击插入，插入空的定位值定义记录。一般来说，Trimble Geomatics Office自动添加新定位值定义域，因此不需要经常进行此操作。但是，由于点列表的第一个点在计算的转换参数中被用作旋转原点，因此要插入定义值定义作为列表的开始。

删除

点击删除，删除列表中的定位值定义。


高程平差 - 概述

更多信息

如何做 ...	对话框	也请参见

高程平差调整点的高程。

平差后，Trimble Geomatics Office软件用以下几种方法应用高程平差：

 在输入已有点的已知高程后，Trimble Geomatics Office计算高程平差参数。

 输入一个常数（正或负）后，Trimble Geomatics Office将它应用于已选择的所有点。

注：如果点的高度或高程质量为控制或平差点，则高程平差不适用。

高程平差结果

进行高程平差时，到点的所有其它观测值或网格定位值都无效。显示的已转换点的网格、地方和WGS-84坐标都将被改变，但坐标系统不变。

下表显示当点列表中含有大量高程时计算出的参数。

注： 已计算的高程平差不包含在坐标系统定义中，这与可在测量/ GPS点校正命令中执行的竖直方向的平差不同。

您可以创建一个显示原点高程、平差后高程和两者之间距离的报告。


高程平差命令

用此命令确定和应用高程平差。

要访问它，选择测量/高程平差。

高程平差对话框出现。


高程平差对话框

 概述及更多信息

使用此对话框确定和应用高程平差。

要访问它：

 选择测量/高程平差。

要对所选项目点的高程进行平差，使用以下几种方法：

  常量法

  平面参数法（输入值或选择点）

常量

选此项将常量值添加到点的高程。将常量应用到所选点或整个项目。

添加到高程

选择常量选项时，添加到高程域变为有效。输入正或负的高程值并添加到点。

参数

选择此项指定或计算倾斜的平面高程平差参数。要选择控制点计算参数，点击点列表。

原点

显示要作为倾斜平面原点的点名称。

注：如果点列表用于选择参数计算所用的点，此域显示所选的第一控制点。

东原点

显示原点的横坐标。如果选择原点域的点，此域用所选点的坐标填充。

北原点

显示原点的纵坐标。如果选择原点域的点，此域用所选点的坐标填充。

改正数常量

显示在原点位置应用的高程改正数。

南北坡度

该值显示南北方向的平面坡度。高程平差通过与原点的百万分比 (ppm) 值和距离（南北向）来计算。它与改正数常量一起使用。

东西坡度

该值显示东西方向的平面坡度。高程平差通过与原点的百万分比 (ppm) 值和距离（东西向）来计算。它与改正数常量一起使用。

点列表

点击点列表，选择要用于计算高程平差参数的控制点。点列表对话框出现。

平差

选择此选项应用平差。有两个选项可以使用：

选择	用此选项将平差应用到所选的点。
整个数据库	用此选项将平差应用到项目中所有的点。
未选择点时，选择按钮无效，平差被应用到项目中的所有点。

产生高程平差报告

选择此检查框创建原高程和平差后高程的报告。报告出现在缺省的HTML浏览器中。


高程平差 - 点列表对话框

 概述及更多信息

Trimble Geomatics Office使用此对话框中所选的点计算高程平差参数。在项目中选择点并输入已知的高程。

要访问它：

1.	选择测量/高程平差。高程平差对话框出现。

2.	点击点列表。

使用填充域或键盘输入来选择每个控制点，并输入已知的高程。

提示：坐标和高程域可用填充域从屏幕选择相应的点来填充。

通常输入三个或更多控制点。这些点平均分布在平差点的周围。

对于定义用于计算高程平差的点数没有限制。添加很多的定义不一定会改善计算的平差结果，但可进一步检查计算出的参数。

统计

统计组显示平差倾斜度的最大值和竖直方向残差的最大值。使用这些统计可以检查输入的值是否正确。

插入

点击插入，插入点定义记录。一般来说，Trimble Geomatics Office 自动添加新的点定义域，因此不需要经常使用此按钮。但是，因为点列表的第一点被作为高程平差原点，您可以使用此功能将一点放在列表的开始处。然而，用于平差原点的定位值通常不太重要。

删除

点击删除，从列表中删除点定义。


撤消命令

用此命令撤消操作。

要访问它，有以下几种方法：

  选择编辑/ 撤消。

  按Ctrl+Z。

在编辑菜单中，出现在撤消命令旁边的文本显示了要被撤消的操作。一次可撤消一步操作。最近一次进行的操作被最先撤消。如果误撤消操作，可使用撤消命令。

如果关闭了项目或Trimble Geomatics Office，就不能撤消前面打开时进行的任何操作。

提示：如果要在关闭项目之后撤消导入操作，使用选择点对话框 / 一般标签中的从来源选项并删除选择，导入操作就被撤消。


恢复命令

用此命令恢复用编辑/撤消命令撤消了的操作。

要访问它，有以下几种方法：

  选择编辑/恢复。

  按Ctrl+Y。

在编辑菜单中，恢复命令旁边的文本显示了要被恢复的操作。

一次可恢复一步操作。

如果关闭了项目，就不能恢复前面打开时进行的任何操作。


剪切 / 复制 / 粘贴命令

剪切、复制、粘贴命令是移动和复制当前所选数据的简便方法。

从编辑菜单中选择剪切、复制或粘贴：

  剪切从当前项目中删除所选内容。

  复制产生所选内容的一个副本。

  粘贴将所选内容插入到另一个项目或应用软件。

剪切或复制所选内容时，它被保存在剪贴板中。每次新的剪切或复制操作将替换前一次的内容。

在将所选内容粘贴到项目或其它应用程序后，所选内容的副本还保留在剪贴板上。可以再次粘贴，次数不限。

用此命令可以：

  在项目之间传输数据（例如，在项目间复制控制点）

  复制和粘贴带属性的点，从一个项目到另一个项目

  复制和粘贴 CAD-任务到报告中

  将数据复制到带有不同坐标系统的项目（例如，带有NAD-27坐标系统的项目中的点可被复制和粘贴到带有 NAD-83坐标系统）

通过使用与元素相关的坐标值，将复制的元素粘贴到一个项目。这可使元素正确定位，因为如果要粘贴到的项目与元素所在的原项目有不同的坐标系统定义，坐标值会自动转换到新的坐标系统。

注： 要从一个项目往另一个项目复制和粘贴观测值，必须使用Trimble Data Exchange Format。不能在Trimble Geomatics Office中进行项目间的复制和粘贴观测值工作。


删除命令

使用此命令删除当前所选实体。

要访问它，有以下几种方法：

  选择编辑/删除。

  按删除。

要撤消删除命令：

  选择编辑 / 撤消。


重命名点命令

用此命令重命名点。

要访问它，选择编辑/重命名点。

重命名对话框出现。


重命名对话框

 概述及更多信息

如果项目中有很多点不是相同的自然点，可以通过使用重命名对话框来解决重复点的问题。

举例

要导入两个不同野外测量队采集的Survey Controller文件：

  一个野外测量队使用的点名为从1000到2000。

  另一个测量队使用的点名为从1000到1050。

如果在限差选项内，在重复点选项对话框中设置了合并重复点，当导入文件时，数据库中创建了51个重复的点(1000 到 1050)。

如果在重复点选项对话框里设置了在总是合并重复点选项期间导入文件，软件会告诉您合并了哪些重复点。如果您想重新命名重复点，撤消导入选项后再重新命名。

具体方法是：

  选择编辑 / 重命名点。重命名对话框出现。

重命名

要重命名点，有以下几个选项：

选择 - 此选项用来重命名已选的点。

整个数据库 - 此选项用来重命名所有点。

如果没有选择点，数据库中的所有点都按缺省重新命名。

提示：要重新命名来自.dc 文件的坐标，用选择点对话框从源选择点。

方法

方法组有以下几个选项：

重命名按

点击重命名按，并输入要替换的第一个名称。

注： 如果输入字母名称，选项中的所有点都将得到相同的名称。进行选择时，输入数值作为名称的最后一个字符进一步识别点名。

添加前缀

点击添加前缀并输入一个前缀。例如，要表示地形点，输入前缀 TOPO 到所选的点名。

提示： 将前缀的最后一个字符设为空格。这用于识别原点和重命名点。

添加后缀

点击添加后缀并输入一个后缀。例如，给点添加日期后缀表示测量日期 (如, 08/10/99)。

提示：将后缀的最后一个字符设为空格。这用于识别原点和重命名点。

添加常量

使用此选项将常量添加到所选点。常量值可以为正，也可以为负。下表给出了几个例子：

注： P1023 - 1000 产生 P23。 如果想要得到的结果是 P0023，则可以进行再次重命名操作 P23 + 0000。

报告

选择此项创建原名称和新名称的报告。点击确认时，报告出现在缺省的HTML浏览器中。


属性命令

用此命令打开属性窗口。

要访问它，选择编辑/属性。

打开属性窗口。


    CAD形式 - 概述

更多信息

也请参见	对话框
概述

在平面视图中，CAD形式设置元素（点、线和文本）在Trimble Geomatics Office图形窗口的显示方式。

CAD形式包括：

  点形式

  线形式

  文本形式

点形式和线形式

点形式和线形式设置点和线的显示方式。

点形式由点符号及其大小、颜色、尺寸设置组成。要创建和编辑点符号，用符号编辑器程序。

线形式由线类型及其大小、颜色、尺寸设置组成。要创建和编辑线类型，用线类型编辑器程序。

要设置点或线的形式，有以下几种方法：

  属性窗口。

  要素代码处理。

要创建和编辑点形式，使用Trimble Geomatics Office中的CAD形式对话框或要素和属性编辑器程序。

Trimble缺省的模板对Symbols (*.sym)文件和Linetype (*.ltp)文件中的每个符号和线类型都有一个点形式和线形式。 形式与符号或线类型的名称相同。

如果点或线的点形式域或线形式域设为< 按图层 >，分配给点或线的点形式或线形式则由图层而来。点和线所在的图层中已经设置了缺省的形式。

要设置不同图层的缺省形式，使用图层对话框。

文本形式

文本形式设置文本元素在Trimble Geomatics Office中的显示方式。设置文本元素的文本形式要使用属性窗口。文本形式由字体、尺寸信息和字体格式组成。Trimble建议了一种文本形式，称为标准形式，但也可以创建您自己的形式。方法是使用Trimble Geomatics Office中的CAD形式对话框。


    形式命令

使用此命令创建和管理点形式、线形式和文本形式。

要访问它，有以下几种方法：

  选择编辑 / 形式。

  按 Ctl+S。

CAD形式对话框出现。


    CAD形式对话框

 概述及更多信息

用 CAD 形式对话框创建和管理点、线和文本形式。

要访问它：

  选择编辑 / 形式。

新建

打开创建形式对话框并在当前标签的基础上创建新的形式。

编辑

点击编辑，编辑已有的形式。如果编辑一个正在被项目中元素使用的CAD形式，则这个元素将被新的CAD形式设置所更新。

删除

点击删除，删除形式。您可删除项目中元素未使用的任何CAD形式。


    创建/编辑点形式对话框

使用此对话框创建或编辑点形式。

要访问它：

1.	在平面视图中选择编辑 / 形式。CAD形式对话框出现。

2.	在点形式标签中完成以下操作：

  点击新建。 出现创建点形式对话框。

  点击编辑。 出现编辑点形式对话框。

选择了形式后，编辑按钮处于激活状态。

名称

输入新的点形式名称或重命名已存在的点形式。所有的点形式名必须是唯一的。但是，可以给点形式、线形式和文本形式使用相同名称。

符号

从符号列表中选择一个符号。要浏览和编辑符号，用符号编辑器程序。

颜色

选择符号颜色。如果选择的是 Window 文本，将使用 Microsoft Windows中的 Window 文本设置来显示该形式。要编辑Window 文本设置，使用控制面板。如果使用 Window 文本，并选择缺省图例形式，则绘图时缺省形式颜色为黑色。要选择缺省图例形式，选择视图 / 选项 / 测量图例标签。如果选择黑色图例形式，则绘图时缺省的形式颜色为白色。

有些符号在定义中已定义了颜色。在 Trimble 符号编辑器程序中创建符号时，将其设置为所定义的颜色。例如，使用 Trimble 符号编辑器程序，符号“树丛”的颜色可定义为绿色。在选择具有颜色定义的符号时，颜色域无效，域显示为“来自符号”。

直径

输入符号的直径。直径域的单位取决于尺寸选项设置是图上还是地面。某些符号没有直径项（如单个象素点），则该域无效。

图上	选择图上选项时，符号的直径值控制符号在图上的大小。

例如，如果尺寸选项设为图上，并在直径域中输入5，Trimble Geomatics Office将在米制图上绘出一个直径5毫米的符号。
Trimble Geomatics Office中的单位是坐标单位。要设置坐标单位，选择文件/ 项目属性 / 单位和格式标签。

图上单位在屏幕上的显示用绘图比例计算。要设置绘图比例，选择文件 / 纸张设置对话框。

地面	选择地面选项时，符号的直径值为地面上的尺寸。

例如，如果直径项设为地面，并在直径域中输入5，Trimble Geomatics Office给出一个5米大小的符号 (或五英尺大小的符号，取决于坐标单位设置)。 这一效果在图上和屏幕上都相同。
要设置坐标单位，选择文件 / 项目属性 / 单位和格式标签。

旋转

使用旋转域控制符号的起始方位。这个域的注释取决于尺寸选项。

图上	选择图上项时，符号的起始方位相对于绘图页面的顶端。

地面	选择地面项时，符号的起始方位相对于北方。

尺寸

点击图上或地面，按上述控制直径和旋转域的操作。


    创建/编辑线形式对话框

使用此对话框创建或编辑线形式。

要访问它:

1.	在平面视图选择编辑/形式。CAD 形式对话框出现。

2. 	在线形式标签中，进行以下一项操作：

  点击新建。创建线形式对话框出现。

  点击编辑。编辑线形式对话框出现。(选择了形式后，编辑按钮变为有效。)

名称

输入新的线形式名称或重命名已存在的线形式。所有的线形式名必须是唯一的。但是，可以给点形式、线形式和文本形式使用相同名称。

设置

用设置组定义形式的外观。

线类型

选择线的类型。 要浏览和编辑线类型，使用Trimble线类型编辑器程序。

颜色

选择线形式颜色。如果选择的是 Window文本，将使用 Microsoft Windows' Window 文本设置来显示该形式。要编辑 Windows 设置，使用控制面板。如果使用 Window 文本，并选择缺省图例形式，则绘图时缺省形式颜色为黑色。要选择缺省图例形式，选择视图 / 选项 / 测量图例标签。如果选择黑色图例形式，则绘图时缺省的形式颜色为白色。

在有些线类型的定义中已定义了颜色。在 Trimble 线类型编辑器程序中创建线类型时，将其设置为所定义的颜色。例如，使用 Trimble 线类型编辑器程序，线类型“篱笆”的颜色可定义为绿色。在选择具有颜色定义的线类型时，颜色域无效，域显示为“来自线类型”。

长度

输入图案重复的长度。选择线的线形式时，如果线类型是一个重复的图案，则该域变为有效。例如，将“围栏线”作为要重复的类型。以下用数字显示：

有些线类型带有固定的长度 (例如，门) ，则此域无效。

域的注释取决于尺寸项的设置。长度域的单位取决于尺寸项是设为图上还是地面。

图上	选择图上选项时，长度值设为毫米 (mm) 或英寸 (in)。(单位取决于坐标单位设置。要设置单位，选择文件 / 项目属性 / 单位和格式标签。)

例如，如果尺寸项设为图上，并在尺寸域中输入5，则将用5毫米（或5英寸）的重复图案画出一条线。

图上单位在屏幕上的显示用绘图比例计算。要设置绘图比例，选择文件 / 纸张设置。

地面	选择地面项时，长度值是坐标单位的地面值。要设置这些单位，选择文件 / 项目属性 / 单位和格式标签。

例如，如果尺寸项设为地面，并在尺寸域中输入5，就得到（在图上和屏幕上）用5毫米（或5英寸）图形重复绘出的一条线。

宽度

输入线的宽度。某些线类型没有宽度（如实线），则该域无效。下图显示怎样应用宽度域：

域的注释取决于尺寸设置。

图上	如果尺寸项设为图上，则线类型将设为毫米或英寸。（单位取决于坐标单位设置。要设置单位，选择文件 / 项目属性 / 单位和格式标签。）

地面	如果尺寸项设为地面，线类型值将是文件 / 项目属性 / 单位和格式的坐标单位中设置的地面值。

尺寸

点击图上或地面, 按上述方法控制长度和宽度域的操作。


    创建/编辑文本形式对话框

使用创建 / 编辑文本形式对话框创建或编辑文本形式。

要访问它:

1.	在平面视图中选择编辑 / 形式 。

CAD 形式对话框出现。

2.	选择文本形式标签。

3.	按以下方式之一操作：

  点击新建。创建文本形式对话框出现。

  点击编辑。 编辑文本形式对话框出现。

形式被创建后，编辑按钮变为有效。

名称

输入新的文本形式名称或重命名已存在的文本形式。所有的文本形式名必须是唯一的。但是，可以给文本形式、线形式和点形式使用相同名称。

字体

选择文本形式的字体。

列表中显示的字体名称是 Microsoft Windows 系统中有效的字体。

颜色

选择文本颜色。如果不选择颜色，缺省为 Microsoft Windows 中的 Window 文本设置。要编辑 Window 文本设置，使用控制面板。如果使用 Window 文本，则形式缺省为黑色。要选择缺省图例形式，选择视图 / 选项 / 测量图例标签。如果选择黑色图例形式，则屏幕上缺省的形式颜色为白色。

高度

输入文本形式高度。

域的注释取决于尺寸设置。

图上	选择图上项时，高度值设置为毫米 (mm) 或英寸 (in)。(单位取决于坐标单位设置，这些单位在文件 / 项目属性 / 单位和格式标签中设置。)

例如，如果选项设为图上，在高度域中输入5，则在米制的图上绘出一个 5mm 的文本高度。屏幕上的图上单位的显示通过文件/纸张设置指定的绘图比例来计算。

地面	选择地面项时，高度值是在文件 / 项目属性 / 单位和格式标签的坐标单位中设置的地面值。

例如，选项设为地面时，在高度域中输入5，则在米制图上显示（在图上和屏幕上）5米高的文本。

字体形式

选择粗体、斜体或下划线检查框创建所需的文本效果。

尺寸

点击图上或地面，按上述方法控制高度域的操作。


    图层命令

用此命令管理当前项目的图层。

要访问它：

  选择编辑 / 图层。

图层对话框出现。


    图层对话框

 概述及更多信息

使用此对话框管理当前项目的图层。

要访问它，有以下几种方法：

  选择编辑 / 图层。

  点击图层工具 [image] 。

  按 Ctrl+L。

当前图层显示在对话框的顶端。

名称

输入图层名。名称必须是唯一的。如果改变包含元素的图层名称，元素将被移动到新的图层上。.

点形式

从列表中选择点形式。列表中的元素是 Trimble 预先定义的点形式和在 Trimble Geomatics Office中 (用编辑 / 形式) 或在要素代码处理时创建的新点形式。(更多信息见要素和属性编辑器程序的帮助。)

在选择了< 按图层 >作为点形式的图层中，所有点都用这个形式。

线形式

从列表中选择线形式。列表中的元素是 Trimble 预先定义的线形式和在 Trimble Geomatics Office中 (用编辑 / 形式) 或在要素代码处理时创建的新线形式。(更多信息见要素和属性编辑器程序 的帮助。)

在选择了< 按图层 >作为线形式的图层中，所有线都用这个形式。

文本形式

从列表中选择文本形式。列表中的元素是 Trimble 预先定义的形式和在 Trimble Geomatics Office中(用编辑 / 形式) 或在要素代码处理时创建的新文本形式。

在选择了< 按图层 >作为文本形式的图层中，所有文本和注释都用这个文本形式。

锁定

在Trimble Geomatics Office图形窗口中，要选择图层中的元素，清除这个检查框。如果不想选择此图层中的元素，选择这个检查框。该域的值就会在图层工具栏的图层选择工具中显示。

如果锁定了图层，图标 [image] 出现在图层工具栏中。

如果未锁定图层，图标 [image] 出现在图层工具栏中。

如果一个或多个图层选择了锁定域，图标 [image] 出现在状态栏中。

注： 如果选择此项，就不能 用以下任一方式浏览图层中的元素。

  使用属性窗口

  通过点击进行选择

  使用选择菜单中的选择命令

可视

要使图形窗口的图层可视，选择此框。该域的值在图层工具栏中的图层选择项工具中显示。

如果图层可视，图标 [image] 出现在图层工具栏中。

如果图层不可视，图标 [image] 出现在图层工具栏中。

要隐藏图层中的元素，清除此框。

注： 如果清除此框，就不能 看见 Trimble Geomatics Office 图形窗口中的任何元素。

图层中的一个或多个元素被隐藏时，隐藏图层图标 [image] 出现在状态栏中。也就是说，一个或多个图层的可视属性被清除时，此图标出现在状态栏中。

警告： 如果图层不可视，则不能浏览或从那个图层中选择元素。这个选项可以应用在图层锁定或未锁定两种情况。也就是说，可视选项优先于锁定选项。

新建

点击新建，将新的图层添加到项目。此时，图层对话框中添加了新的行。在新图层中给各栏输入值。

删除

点击删除，删除当前突出显示的图层。如果删除的图层包含元素，将出现一个警告对话框。对话框提醒如果删除该图层，图层中的元素也将被删除。

当前

点击当前，使所选的图层成为当前图层。当前图层被突出显示。当前图层是添加新元素的图层。任何添加到数据库且没有图层名称的元素 (点、直线、弧、曲线、文本和注释)都被添加到当前图层。

提示： 您可以在图层对话框中编辑多个元素：

1.	使用 Ctrl 键选择多个元素。

2.	编辑最后一个选中的域。则所有选中的域都将被更新。


    图层 - 概述

更多信息

如何作 ...	对话框	也请参见
概述

在平面视图，项目中的每个元素都属于一个图层。图层由名称、点形式、线形式和文本形式组成。将数据组织到图层可便于管理。在管理大的数据组时这是非常有用的。例如，具有要素‘树’的所有点都被分到称为‘树’的组。缺省的图层用于所有元素，除非在项目中创建了新的图层。

所有元素(点、直线、弧、曲线、文本和注释)都有一个图层域。可使用属性窗口查看元素。要选择元素所在的图层，用以下方法之一：

  将元素添加到项目中时，在相应的对话框的图层域中选择图层。

  导入指定了图层的文件。

  使用要素代码处理。

  要在项目中选择已有元素的图层，使用属性窗口。

要管理项目中的图层，用图层对话框。

使用图层选择工具栏指定可看见和选择的图层。如果要在所选图层中选择元素：

  选择选择 / 按图层。

如果给数据库中的点选择了点形式域的 < 按图层 >，图层所指定的点形式就被分配到该点。如果给直线、曲线或弧选择了线形式域的< 按图层 >，图层所指定的线形式就被分配到直线、曲线和弧。同样，如果给文本或注释选择了文本形式域的< 按图层 >，图层所指定的文本形式就被分配到文本或注释。


重复点 - 概述

更多信息

如何做...	对话框
概述

导入同名点时，Trimble Geomatics Office提供两个选择：

1. 	总是合并重复点

2.	合并限差范围内的重复点。您可以指定软件合并点的水平或垂直限差，或者指定软件不解决导入的重复点。

缺省地，Trimble Geomatics Office在导入时合并同名点，因此不会产生重复点。(这是导入数据的最快方式) 。

如果不选择合并重复点，在导入限差外带有同一点观测值或坐标的一个或多个文件时，将产生重复点。例如，在您导入：

  包含与数据库中已有点同名的、并且在限差外的点的文件

  从不同的测量控制器 (*.dc) 文件而来的同名点

必要时，可在软件内用合并重复点命令来合并点。

Trimble Geomatics Office合并点的方式

点可能只有一个用户输入的WGS-84坐标和一个用户输入的网格/地方坐标。Trimble Geomatics Office按照以下规则选择是覆盖WGS-84坐标还是网格/地方坐标：

1.	保留最高质量的坐标。

2.	使用最后输入数据库的坐标成分。

点来源报告提供确定点坐标的测量数据上的详细信息，而导入报告只列出被覆盖或丢弃的坐标成分。

注： 如果软件覆盖了要用的坐标，则必须撤销导入操作，编辑导入文件（或Trimble Geomatics Office 项目中的点名称），并重新导入数据。或者，撤消导入操作，用重复点选项对话框中的合并重复点重新导入文件。然后，您可以在Trimble Geomatics Office中仅仅重命名重复点。


重复点选项对话框

更多信息

如何做...	也请参见

使用重复点选项对话框指定Trimble Geomatics Office在重复点被导入到项目中时的处理方式。

对话框中的设置应用于所有导入选项；无论用项目栏导入文件还是将文件拖放到 Trimble Geomatics Office 项目，软件都使用最后指定的重复点选项设置。 您可以创建一个模板来设置重复点选项。

要访问重复点选项对话框：

1．选择文件 / 导入。导入对话框出现。

2．点击选项。

下列各组描述了相应的选项。

总是合并重复点

此选项被缺省选择。软件合并导入时的同名点，因此不会产生重复点。导入后，导入报告列出覆盖或丢弃的坐标成分。

注： 如果软件覆盖了要使用的坐标，您必须撤销导入操作，编辑导入文件（或Trimble Geomatics Office 项目中的点名称），并重新导入数据。或者，撤销导入操作，在重复点选项对话框中用限差范围内的合并重复点选项重新导入数据。然后，您可以在Trimble Geomatics Office中仅仅重命名重复点。

在限差范围内合并重复点

如果选择此项，则在指定的水平和/或垂直限差范围内的所有测量数据被放置到同一点中。缺省限差值由项目属性对话框中的重新计算标签指定的未知水平和垂直限差来确定。导入之后，导入报告列出所有被覆盖或放弃的坐标。

也可用此选项指定软件不 在导入时合并重复点。方法是，将导入数据的限差设为0.02 (即水平测量质量容限) 和 0.050 (即垂直测量质量容限)。然后在Trimble Geomatics Office中重命名重复点。如果水平和垂直限差都被指定，要合并的重复点必须是在水平和垂直限差范围内。如果没有指定限差（即：在限差组中，水平和垂直检查框都未被选择），则重复点将被合并。

注：导入数字水准数据时，只用到垂直限差。

注：如果限差设置到 0.000，重复点坐标必须准确地与要合并的点相同。


分解点命令

使用此命令通过分离数据来从一点创建许多点：

  根据数据源

  根据所有观测值

  根据数据类型 (GPS / 地面的)

要访问它, 选择编辑 / 分解点。分解点对话框 出现。

用分解点选项进行：

  分解重复点

  计算每个观测值的位置

  GPS 数据和网格/地方数据在同一点时，在Trimble Geomatics Office中进行校正

  分离地面和 GPS 观测值


分解点对话框

点可包含从多个数据源而来的测量数据。数据源了可包含多个观测值；但只有一个观测值可用于产生点的计算位置。

可使用分解点选项通过区分数据、所有观测值、或数据类型 (GPS/地面) 来创建点。把点分解到：

  分解重复点

  计算每个观测值的位置

  当 GPS 数据和网格/当地数据是在相同的点下时，在Trimble Geomatics Office中执行GPS 点校正

  分离地面和 GPS 观测值

分解点时，操作创建同名的一些点。

例如，将两个测量控制器 (*.dc) 文件导入到同一个项目：

  第一个 .dc 文件包含点 '101' 的常规观测值。

  第二个 .dc 文件包含同一点 '101' 的键入坐标和 GPS 观测值。

导入第一个文件时，项目中创建了一个 '101' 点，观测值用于产生点的定位值。导入第二个文件时，Trimble Geomatics Office将 .dc 文件的键入坐标和项目中点的定位值进行比较。因为 .dc 文件的测量数据是对于同一点 '101' 的，项目中的点和 .dc 文件自动合并在一起。测量数据来自于两个数据源：第一和第二个测量控制器 (*.dc) 文件。该点将有三组坐标源：

  常规观测值

  键入坐标

  GPS 观测

提示：您可在属性窗口的页面菜单中查看数据源、观测值和点的坐标内容。

如果在包含多重观测值或坐标的当前选择集中有一个点，则只能分解点。

要访问分解点对话框，选择编辑 / 分解点。

分解

如果要用分解点来创建分离的点，则软件用下列方法之一分离数据：

按数据源	例如，.dc 文件。
按所有观测值	从点的所有观测值和坐标创建不同的点。
按数据类型	所有 GPS 观测值和 WGS-84 坐标都被放在一个点下。所有网格坐标和大地观测值都被放在另一个点下。
注：如果需要在Trimble Geomatics Office中执行 GPS 点校正，并且 GPS 观测值和网格坐标在同一个点下，则采用按数据类型选项的分解点。这个操作创建两个点，一个网格点和一个 GPS 点。然后您能够用这些点执行 GPS 点校正。

重命名带有后缀 (_GPS) 的GPS点

如果选择按数据类型选项，带有后缀的重命名GPS 点选项就变为有效。您可以通过选择要加到GPS 点的后缀来给点起一个唯一的名称。如果不选此项，点就会按数据类型分解，并且各点具有相同名称。

显示分解统计数

选择此框显示可用所选分解方法创建的点数。


复合编辑命令

也请参见

使用此命令编辑所选项中与测量相关的或与CAD相关的元素属性。此命令只有在具有当前选择集时才有效。

要访问它，有以下几种方法：

  选择编辑 / 复合编辑。

  从快捷菜单选择复合编辑。

复合编辑(测量标签或CAD标签)对话框出现。


复合编辑对话框 - 测量标签

使用此对话框编辑多个元素的与测量相关的属性。例如，如果在野外发现输入的一组GPS点的观测值的天线高不正确，则可以进行改正。

要访问它，有以下几种方法：

  选择编辑 / 复合编辑。

  从快捷菜单中选择复合编辑。

编辑所选点

该组包含可编辑的所选点的测量相关属性。

设置天线高

选择此框激活以下域。这些域用来改变点观测时段的天线高。

改变高度尺寸	选择要改变点的天线高值。列表包括所选点的输入高度。只有所选值的天线高可以改变。
新天线高	输入要使用的正确天线高。
设置 GPS 天线细节

选择此框激活以下域。这些域用来改变所选点的天线类型和/或测量方法。

天线类型	选择要改变的点的天线类型。
测量方法	选择要改变的点的测量方法。该域中的列表取决于所选的天线类型。如果选择了新的天线类型，该域内容被清除。
设置常规目标细节

选择此框激活以下域。这些域用来改变所选点的目标高度和棱柱常量。

目标高度	输入要应用的正确目标高度。
棱柱常量	输入要应用的棱柱常量。
设置激光目标高度

选择此框激活该域。输入要用的正确目标高度。

对所选观测值执行此编辑

该组包含可编辑的所选观测值（GPS、常规、激光）的测量相关属性。

在网平差中应用

选择此框激活该域。在网平差中使用（或排除）所选观测值 (如果安装了网平差模块) 时使用该域。

该设置只应用于带有协方差 (QC2) 信息的GPS观测值。将其设置为不时，网平差的观测值不能使用。但是，在重新计算以确定点的定位值时还会使用它们。

设置观测值状态到

选择此框激活该域。使用该域在重新计算期间激活或禁用观测值 ，或激活观测值作为检查项。

如果禁用观测值，则在重新计算时这些观测值将不能使用，并且这些观测值的环闭合差误差将被报告出来。如果激活观测值作为检查项，在没有其它激活的观测值或坐标可用时，这些观测值用于给点加上坐标。

抑制类型标志

选择此框激活该域。选择您要在测量视图中抑制的警告标记类型。如果进行重新计算，警告标记将会再次出现。

注：选择一个检查框编辑具体域时，Trimble Geomatics Office检查所选的元素。如果发现不能在所选元素上使用的域，检查框选项将被禁用。


复合编辑对话框 - CAD标签

使用此对话框编辑所选项中元素的CAD相关属性。

要访问它，有以下几种方法：

  选择编辑/复合编辑。

  从快捷菜单选择复合编辑。

对所选点执行此编辑

该组包含可编辑的所选点的CAD相关属性。

设置要素代码

选择此框激活该域。输入要应用到所选点的要素代码值。

设置图层

选择此框激活该域。选择要分配给所选点的图层。如果输入了不存在的图层，新建图层对话框将会出现。

设置点形式

选择此框激活该域。选择要应用到所选点的点形式。如果输入了不存在的点形式，创建点形式对话框将会出现。

删除所有注释

选择此框，删除所选点的任何注释。

对所选线网执行此编辑

该组包含可编辑的所选线型（直线、曲线、弧）的CAD相关属性。

设置图层

选择此框激活该域。选择要给所选线型分配的图层。如果选择的图层不存在，将出现新建图层对话框。

设置线形式

选择此框激活该域。选择要给应用于所选线型的线形式。如果选择的线形式不存在，创建线形式对话框将会出现。

删除所有注释

选择此框，删除所选线型的任何注释。

对所选文本执行此编辑

该组包含可编辑的所选文本的域。

设置图层

选择此框激活该域。选择要给所选文本分配的图层。如果选择的图层不存在，将出现新建图层对话框。

设置文本形式

选择此框激活该域。选择要应用到所选文本的文本形式。如果选择的文本形式不存在，创建文本形式对话框将会出现。


    激活/禁用观测值命令

使用此命令激活或禁用观测值。禁用观测值将使观测值不能用于任何测量计算。

要访问它，有以下几种方法：

  选择编辑 / 激活 / 禁用观测值。

  在属性窗口，使用观测值的状态域。

  在复合编辑对话框 / 测量标签中，使用设置观测值状态到域。

注：重新计算确定点的计算位置时考虑了观测值状态。可使用激活 / 禁用观测值功能禁用观测值的状态，以便在重新计算时将其删除。

您只能改变观测值的状态，当：

  存在当前选择集，并且

  选择集中的所有观测值都有相同的观测值状态。

注： 如果在当前选择集中有一个以上的观测值，您可以设置多个观测值的状态。

禁用观测值时，观测值线的颜色变为暗红。

注： 如果沿同一条线有多个观测值，并且所有观测值都被禁用，则观测值只显示为红色。


     反向观测值溢出命令

向量应用于观测的方向。使观测值的方向反向时使用此命令，并强制应用于相反的方向。

要访问它，选择编辑 / 反向观测值溢出。

在让观测值溢出的方向反向时，计算出的点坐标和质量可能会改变。重新计算处理 必须 被用于观测值，并计算新的点位置。

警告： 如果观测值溢出起点没有已知位置（如RTK观测点），则此观测值不能应用。


新建图层对话框

使用此对话框创建新图层。如果在插入或编辑元素（点、直线、曲线、弧、文本）时输入不存在的图层名称，将会出现此对话框。

名称

输入所选元素要移动到的图层名称。

点形式

从列表中选择点形式。列表中的元素是 Trimble 已定义的形式和 Trimble Geomatics Office中创建（用编辑/形式）或在要素代码处理时创建的所有新点形式。

更多信息，参见要素和属性编辑器程序的帮助。

对于选择<按图层>作为点形式的图层，该点形式用于所有点。

线形式

从列表中选择线形式。列表中的元素是 Trimble 已定义的形式和 Trimble Geomatics Office中创建（用编辑/形式）的所有新线形式。

对于选择<按图层>作为文本形式的图层，该线形式用于所有线型。

文本形式

从列表中选择文本形式。列表中的元素是 Trimble 已定义的形式和 Trimble Geomatics Office中创建（用编辑/形式）的所有新文本形式。

对于选择<按图层>作为文本形式的图层，该文本形式用于所有文本和注释。

锁定

为了可以选择 Trimble Geomatics Office 图形窗口的图层中的元素，清除此检查框。如果不想选择图层中的元素，选择此检查框。图层工具栏的图层选择工具显示该域的值。

如果图层被锁定，图标 [image] 出现在图层工具栏。

如果图层未锁定，图标 [image] 出现在图层工具栏。

如果一个或多个图层选择了锁定域，图标 [image] 出现在状态栏。

注： 如果选择此框，就不能 用以下方法浏览图层中的元素：

  使用属性窗口。

  通过点击选择元素。

  使用选择菜单中的选择命令。

可视

要在图形窗口中看到图层中的元素，选择此框。图层工具栏的图层选择工具显示该域的值。

如果图层可视，图标 [image] 出现在图层工具栏。

如果图层不可视，图标 [image] 出现在图层工具栏。

要隐藏图层中的元素，清除此框。

注： 如果清除此框，就不能 在Trimble Geomatics Office图形窗口看到该图层的任何元素。

图层中的一个或多个元素被隐藏时，可视图标 [image] 出现在状态栏。也就是说，一个或多个图层清除了可视属性时，该图标出现在状态栏。

警告： 如果图层不可视，则不能浏览或从那个图层中选择元素。这个选项可以应用在图层锁定或未锁定两种情况。也就是说，可视选项优先于锁定选项。


移动点和文本命令

使用此命令访问移动对话框。此命令只在有当前选择集时才有效。要访问它，选择编辑 / 移动点和文本。.

移动对话框出现。


移动对话框

使用此对话框移动点或文本。

要访问它，选择编辑 / 移动点和文本。

质量为控制、固定控制或平差的点不被移动。如果所选的要移动的点是已平差、固定控制或控制质量，将出现提示信息。

警告： 移动一点将禁用到该点的观测值或坐标。您可以用属性窗口重新激活它们。 重新激活观测值和坐标可将被移动的点重新定位到起始位置。

选择文本或点，并在对话框中输入新位置。当在点对话框中点击确认时就会发生移动。

按变化量移动

选择移动用选项将所选文本或点移动到由纵横向平移量（变化量）确定的新位置。

有两个选项可用：

横向变化量	此项将显示的横向变化量增加到所选元素的横坐标中。

纵向变化量	此项将显示的纵向变化量增加到所选元素的纵坐标中。

移动到点

选择移动到点框将所选点移动到另一点的位置。

名称

使用此域命名或选择新位置的点。

移动到坐标

选择移动到坐标框将所选文本或点移动到新的位置。有两个选项可用：

横坐标	使用此域输入或选择所选点的新横坐标值。

纵坐标	使用此域输入或选择所选点的新纵坐标值。

设置高程为零

选择设置高程为零框将移动的点的高程设为零。如果不选此项，则保留点的已有高程值。

注： 移动的点的任何观测值都变为无效。


重复点对话框

 概述及更多信息

在导入一个包含与项目中其它点同名的点的文件时，结果是项目中创建了同名的一些点。重复点对话框出现并提示以下信息：

″导入操作使数据库中创建了同名的点，（重复点）。″

可以通过以下方法去掉同名点：

  如果知道它们是相同的自然点，合并同名点

  如果不是相同的自然点，重命名同名点


信息反馈

感谢您购买本产品。如果您能提供信息反馈，我们将非常感激。请将意见和建议发至：

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642
Sunnyvale, CA 94086-3642
U.S.A.

Phone: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
http://www.trimble.com/

如果您对此文本有任何建议，请与我们联系。您的建议将帮助我们完善今后的版本。如果提供了特别有价值的建议，您将得到一份礼物作为答谢。

请将建议发至以上地址，或用电子邮件发至ReaderFeedback@trimble.com

所有建议和意见都将被 Trimble 导航有限公司视为财富。


新项目命令

用这个命令来创建新项目或模板。

要访问它，进行以下一项操作：

  选择文件 / 新项目。

  在标准工具栏上点击新项目钮 [image] 。

  按Ctrl+N。

新项目对话框出现。


新项目对话框

用这个对话框来创建新项目或模板。

要访问它，进行以下一项操作 ：

  选择文件 / 新项目。

  在标准工具栏上点击新项目钮 [image] 。

  按Ctrl+N。

  在项目条上点击快捷的新项目。

名称

输入您想创建的项目名称。用文件夹钮选择时，带有项目名称的新文件夹就在当前的项目文件夹下创建出来。

模板

模板列表显示了系统中可以用的项目模板。在 Trimble Geomatics Office中使用项目模板和在 Microsoft Word 或在 AutoCAD 模型绘图中使用模板文档相似。创建每个新项目时，用一个模板作为新项目的基础形式。您使用的模板仍保持不变。

提示：增加到模板的新的CAD形式可以用在基于那个模板的多个项目中。在给定地区进行的工作中可能需要一系列个别的项目，在这种场合下，您可以为地区、特殊形式和控制点创建一个包括特定坐标系统的模板。这样，它可以立即用在所有的新项目中。

只要定义了项目模板，您就能为很多不同的项目多次使用这些模板。

从列表中显示的模板名称中，选择最适合的模板。您所选的模板构成了您要创建的新项目的基础。

细节

细节列表显示了坐标系统的细节和所选模板的标题。这可以帮助您选择最适合的模板。

另外，创建和放置项目的文件夹也被显示出来。这个文件夹反映了直接定义在名称域中的内容，或者反映了通过使用文件夹而直接定义的内容。

投影选项是被预定义在模板项目中的，投影可以被改变。

文件夹

点击文件夹，选择您想创建新项目的文件夹。

如果用文件夹选项来选择文件夹，则Trimble Geomatics Office使用的缺省位置会在您下一次打开或创建项目时改变。

要使用显示在文件夹浏览对话框里的文件夹树形结构，进行以下一项操作 ：

  直接选择一个项目文件夹。

  选择包含若干个项目的文件夹。

新建

点击新建来创建一个新项目或新模板。

当设置到模板后，您可以根据当前选择的模板在适当的文件夹中创建新模板。您能用这个功能来为特定目的产生新的模板。


打开项目命令

用这个命令打开现有的项目。

要访问它，进行以下一项操作 ：

  选择文件 / 打开项目。

  在标准工具栏上点击打开项目钮

  按Ctrl+O。

打开项目对话框出现。


打开项目对话框

用这个对话框打开现有的项目。

要访问它，进行以下一项操作 ：

  选择文件 / 打开项目。

  在标准工具栏上点击打开项目钮 [image] 。

  按Ctrl+O。

注：如果您已经打开了一个项目，您会被警告这个操作将关闭当前的项目。

注：项目预览示于打开项目对话框中。

名称

输入您想打开的项目名称。

当前项目文件夹里的项目列表出现在名称域下面。选择这些项目名称中的一个，自动输入名称到名称域中。

您也可以在名称域中输入一个到达您想打开的项目的目录路径。

例如，您能够在文件夹MYPROJ on C:\ 驱动器中有几个项目。

输入C:\myproj\。Trimble Geomatics Office将显示那些在该文件夹中可被选择的项目。与点击文件夹不同的是：用这种方法打开的项目不改变缺省项目文件夹。请看下列对文件夹钮的描述。

文件夹

点击文件夹，选择要从中打开项目的那个文件夹。

要使用显示在文件夹浏览对话框里的文件夹树形结构，进行以下一项操作 ：

  直接选择一个项目文件夹。

  选择包含若干个项目的文件夹。

细节

细节列表显示了坐标系统和项目标题细节，并指明了存储项目的文件夹。使用这些细节可以帮助您打开适合的模板。细节能用文件 / 项目属性 / 单位和格式标签改变。

注：如果您没有安装 WAVE 基线处理模块或网平差模块，则当您打开用这些模块创建的现有项目时，测量数据保持不变。您可以查看来自禁用模块（例如：误差椭圆和已处理基线）的数据。需要更进一步使用禁用模块的作业不可能实行。


关闭项目命令

用这个命令关闭当前的项目。

要访问它，选择文件 / 关闭项目。

对项目（包括已存的选择集和视图）进行的所有改变都被保存为您项目中的工作。您可以不经保存而关闭项目。


删除项目命令

用这个命令删除项目。

要访问它，选择文件 / 删除项目。

删除项目对话框出现。


删除项目对话框

用这个对话框删除项目。这个项目必须是关闭的。

要访问它，选择文件 / 删除项目。

提示：可以从回收站恢复删除的项目。

名称

输入您想删除的项目名称。

在删除对话框中，当前项目文件夹里的项目列表出现在名称域下面。选择这些项目名称中的一个，自动输入名称到名称域中。

也可以输入一个到达您想删除的项目的目录路径。

例如，您可能在文件夹MYPROJ on C:\ 驱动器中有几个项目。

输入C:\myproj\。Trimble Geomatics Office将显示那些在该文件夹中可被选择的项目。与使用文件夹不同的是：用这种方法删除的项目不改变缺省项目文件夹。看下列对删除组的描述。

删除组

要查看您想删除的项目，选择项目选项。

要查看您想删除的模板，选择模板选项。

文件夹

点击文件夹，选择要从中删除项目的那个文件夹。如果用文件夹选择文件夹，则Trimble Geomatics Office使用的缺省会在您下一次打开或创建项目时改变。

要使用显示在文件夹浏览对话框里的文件夹树形结构，进行以下一项操作：

  直接选择一个项目文件夹。

  选择包含若干个项目的文件夹。

删除

点击删除，删除已选择的项目。包含在项目中的所有文件和文件夹都被删除掉。

细节

细节组显示了坐标系统和项目标题细节，并指明了存储项目的文件夹。使用这些细节可以帮助您确认正在删除的项目的确是您不想要的项目。


导入命令

用这个命令打开导入对话框。

要访问它，进行以下一项操作 ：

  选择文件/ 导入。

  在标准工具栏上点击导入钮 [image] 。

  使用项目条上的导入组 。

导入对话框出现。


导出命令

用这个命令导出数据到另一个格式或到一个 Trimble 设备。

要访问它，进行以下一项操作 ：

  选择文件 / 导出。

  在标准工具栏上点击导出钮 [image] 。

导出对话框出现。


表单设置命令

在产生绘图之前，用这个命令改变表单版面设置。

您可以：

  选择您想用于绘图的图框。

  分配绘图比例、原点和起点。

要访问它，选择文件 / 表单设置。

表单设置对话框出现。


表单设置对话框

在产生绘图之前，用这个对话框改变表单版面设置。您能够选择您想在绘图中使用的图框，并分配绘图比例、原点和起点。

要访问它，选择文件 / 表单设置。

图框

图框提供了绘图用的模板。您可以自定义模板，从而提供绘图构件（诸如指北箭头或公司标志）以及剪贴区域、框架、线段和文本注释。图框应用于为已选打印机 或 绘图仪设置的表单大小，它也将为打印机或绘图仪确认横置或竖置设定。

您可以用打印设置来改变这些设定。

在文件域中，输入所希望的图框文件名。

浏览

浏览对话框显示了可用图框（*.frm）文件的列表。

选择您需要的图框文件名。

Trimble Navigation Limited 提供了几个不同的图框。您也可以创建自己的图框。详细资料请参考图框 - 概述。

比例、绘图旋转、原点N（北）、原点E（东）

用这些域来定义被绘制的项目的区域。

只要您设置了比例，一个表示将要绘制的项目区域的‘绘图框’就会出现在图形窗口中。它是基于原点坐标的。改变比例能够增加或减少绘图的范围。

提示：设置绘图旋转域到所需绘图起点的值上。这个域中的值将设置绘图表单侧边的起点，而不是设置图中北点的旋转。绘图框可以移动。如果要移动，则围绕数据移动以便适合项目数据。

点击原点北或原点东域，然后点击并拖拉‘绘图框’来覆盖需要的区域。您可以把绘图旋转域设置到一个数值上，这个数值给出您所需要的绘图起点。使用这个域时，您在指定绘图表单侧边的起点，而不是图中北点的旋转。

确认

点击确认来确认您的绘图表单设置。这些设置细节被存储，然后用在绘图 / 打印选项中。

最佳拟合

点击最佳拟合，让系统为比例和原点域计算最隹数值，从而绘出当前显示的所有项目数据。当您使用这个选项时，绘图旋转缺省为0°。

打印设置

点击打印设置来打开您系统的打印设置对话框。用这个对话框选择合适的打印机或绘图仪、选用纸张尺寸和来源、以及选择纸的绘图输出起点（横置或竖置）。


计划表 - 概述
图框 - 概述

图框（*.frm）文件存储为文本文件。它包含一系列描写放在图框上的内容和位置的陈述。您可以在图框定义中包含线、文本、符号（例如，北点）和Microsoft Windows改进的变量文件（*.wmf），从而建立所希望的版面形式。

评注

在提供的图框里，有一些评注用来解释图框定义中可用的不同评注的含义。要用文本编辑器来编辑图框定义。提供的图框定义通常位于主程序文件夹下的系统文件夹内（典型地，C:\ 程序文件 \ Trimble \ Trimble Geomatics Office ）。

提示：在Trimble Geomatics Office安装期间，Microsoft Notepad 文本编辑器分配给了文件扩展的打开操作。因此，当选择一个图框文件时，或者当在 Microsoft Windows Explorer 程序中时，如果您突出显示 .frm 文件，您就能在快捷菜单中用打开选项来显示 Microsoft Notepad 中的图框细节。

更多信息，请看图框定义细节。


计划表定义细节
图框定义细节

 概述

图框定义存储在与标准的 Windows *.ini 文件格式相似的格式中。格式由一些放在方括号（ [ ] ）里的段标题构成。每个段里定义了个别的条目，每个条目有一个唯一的名称，并且这个名称用‘=’符号被赋予适当的数值。评注能被放在文件内，但它必须自成一行并以分号开头 (;)。

图框定义内的特殊坐标系统允许把相同的图框用在不同的绘图表单尺寸上。所有的坐标值都设定为毫米、并且总是在括号内用逗号区分特定的对，其中x（或水平的）值在前面、y（或垂直的）值在后面。

例如，(20,40) 就是一个有效的坐标位置。

表单的左上绘图角被定义为具有坐标 +0.0, +0.0。所有的正坐标值都被解释为位于这个位置的右下方。表单的右下绘图角被定义为具有坐标 �0.0, �0.0。所有的负坐标值都被解释为位于这个位置的左上方。

注：表单的绘图角是实际绘图（或打印）的界限，这些界限由绘图仪或打印机在给定的表单上实施，并且它们将根据不同的绘图仪或打印机而不同。例如，这些界限会被诸如表单在绘图仪滚筒上的置放方法这样的因素所影响。

为了示范，下表显示了各种坐标位置及其详细解释：

段

下面所示是图框定义文件中的段：


绘制 / 打印命令

使用这个命令进行：

  查看已安装的绘图仪和打印机的列表。

  设置缺省绘图仪或打印机。

  为已选择的绘图仪或打印机进入其它的绘图或打印选项。

要访问它，进行以下一项操作 ：

  选择文件 / 绘图 / 打印。

  按Ctrl+P。

在 Trimble Geomatics Office中进行打印之前，您必须：

  把绘图仪或打印机接在您的计算机或网络上。

  如果不显示已经安装的绘图仪或打印机，则用 Microsoft Windows设置或Microsoft Windows控制板安装绘图仪或打印驱动程序。详细资料请看 Microsoft Windows 帮助。

  在绘图 / 打印设置对话框中，选择您想使用的绘图仪或打印机。

注：如果在图形窗口中显示有格网线，它们会画到图上。


项目属性命令

使用这个命令打开项目属性对话框。要访问它，选择文件 / 项目属性。


最后的项目命令

文件菜单列出了您最近打开的最后4个项目。

要打开最近使用过的项目，从文件菜单列表中选择其中之一。


退出命令

用这个命令关闭当前项目并退出 Trimble Geomatics Office。

Trimble Geomatics Office将自动保存您的改变。


复制项目命令

用这个命令复制现有的Trimble Geomatics Office 项目。只有在没有项目正在打开时，这个命令才可以使用。

项目到复制对话框出现。


项目到复制对话框

用这个对话框选择您想复制的项目。

要进入这个对话框：

  选择文件 / 复制项目。

只有在没有项目正在打开时，这个选项才可以用。

从列表中选择项目。

关于已选项目的细节出现在项目列表下面。

文件夹

要从不同的文件夹中选择项目，点击文件夹。

当您已经选择了您想复制的项目时，点击确认。

复制项目到对话框出现。


复制项目到对话框

用这个对话框输入您正在复制的项目的新名称。

项目主题

输入项目的名称。

文件夹

进行如下一项操作：

  点击省略钮，复制项目到不同的文件夹。

  用键盘输入文件夹路径。


 文件转换协议 (FTP) 站点

可以使用 Trimble FTP 站点发送或接收文件，如软件补丁、应用程序和常见问题(FAQs)回答。可从Trimble 全球互联网上访问FTP站点: http://www.trimble.com/support/support.htm。


GIS 格式 - 概述

更多信息

如何做 ...	也请参见

概述

可从Trimble Geomatics Office将点及相关属性导出到各种地理信息系统（GIS）格式，但不导出直线、曲线、弧、文本和注释。

见下表：

导出时，可创建要导出的新属性（如采集属性的时间或日期，或者点的高程）。

也可创建自定义 ASCII导出或报告格式来导出点及其属性。

以下列出两个自定义 GIS 格式:

  名称，经度，纬度，高度，所有属性（地方）

  名称，北，东，高程，所有属性

使用GIS标签将数据导出到各种GIS格式。

要访问此标签：

1.	采用以下方法之一：

  选择文件/导出。

  使用项目条上的导出组。

导出对话框出现。

2.	选择GIS标签。

您可以将自定义格式移动到此标签。更多信息，参见Asciiexp.dat文件。

关于导出到GIS格式的更多信息，参见GIS导出格式。

此标签有下列格式：


ArcView文件 (*.dbf, *.shp, *.shx) 选项

导出到 ArcView 格式时，带有属性的每个要素码创建了三个文件。

下表描述了这些文件：

这些文件是二进制文件。不能用文本编辑器浏览或编辑。

Trimble Geomatics Office自动命名这些文件。

例如，对于要素码‘树’的带属性点，将创建以下文件：

  Tree.shp

  Tree.shx

  Tree.dbf

关于 ArcView设置的信息，参见主题导出选项对话框。ArcView不含有所有格式共同设置之外的任何设置。

注： 只有ArcView3.1版或更高版本支持3D点。


带属性的AutoCAD文件 (*.dxf)选项

当导出到带属性的AutoCAD文件 (*.dxf) 选项时，创建了.dxf文件。

使用绘图交换格式(.dxf) 文件交换和显示图形和列表数据。

配置

除了在导出选项对话框主题中描述的标准设置外，还有AutoCAD专用设置。

点击选项。 出现导出选项对话框。

文本尺寸

指定输出文件的文本尺寸时有两个选项：

自动	文本尺寸从输入文件自动计算。
固定	文本尺寸是固定的。进行以下一向操作：   在文本尺寸域，输入所需的文本尺寸。   使用箭头按钮。
块选项

选择块检查框中的导出要素项来导出块中的属性信息。这表明在读入支持.dxf 格式的GIS或CAD系统时，可查询和编辑属性。块插入点组变为有效。在块中放置插入点有两种选项：

  原点	将插入点放在块中的 0,0位置。

  重心	将插入点放在计算出的块的重心。

如果不选择块检查框内的导出要素框，则这些选项无效。相反，要素的位置信息保存为POLYLINE或 POINT元素，属性信息写为TEXT。TEXT写入到各要素的相应图层。此时，块插入点组无效。

注： 如果不在块中导出，属性名称就不需要导出椫坏汲鍪粜灾怠Ｈ绻�您在导出到任何AutoCAD GIS软件包，例如AutoCAD 地图，则总是在块中导出，因此包含属性名称。

图层选项

.dxf 文件将不同信息组织到图层中。这些图层可各自独立进行操作。有两个图层选项：

  一个要素每个图层 - 每个要素创建一个不同的图层。例如，灯杆要素与树要素放在不同的图层。各图层的名称是要素的名称。

  所有要素一个图层 - 所有要素放在一个图层中。图层名称域有效。在图层名称域中输入图层名称，图层名称域不能为空。

将要素名称中的空格符改为下划线

有些读取 .dxf 文件的程序需要在 .dxf 文件的图层名称中没有空格。选择此选项将要素名称中的空格符改为下划线字符(_)。


MapInfo文件 (*.mif, *.mid) 选项

在导出到MapInfo格式时，每个带有属性的要素码创建了两个文件。在下表中进行描述：

这些文件是文本文件。可以用文本编辑器进行浏览或编辑。这些文件举例如下：

MIF File

VERSION 2

  DELIMITER "	"

  COORDSYS EARTH PROJECTION 1, 104

COLUMNS 3

  Height_m  DECIMAL(5,0)

  Needs_attention  CHAR(30)

  Remarks  CHAR(30)

DATA

POINT 700345.32 306565.45

POINT 700356.47 306125.38

POINT 700937.71 306505.41

MID File

1	Yes	Branches in wires

2	Yes	Dead

3	No	Directly beside pole

Trimble Geomatics Office自动命名这些文件。例如，对于要素码‘树’的带属性点，将创建以下文件：

  tree.mif

  tree.mid

MapInfo不含有所有格式共同设置之外的任何设置。这在导出选项对话框主题中进行描述。

注： MapInfo只支持2D点。


Microstation文件 (*.dgn) 选项

在导出到Microstation (*.dgn)格式时，一个文件就被创建。您需要输入要导出的文件名称。

配置

除了在导出选项对话框中把所有格式设置为可用外，以下选项也用于导出到Microstation DGN格式的配置。

吸附

选择此检查框确定所创建的 .dgn 文件带有 '可吸附' 要素。使用Microstation中的此选项，在点击关闭要素时，光标很快指向准确位置。

分辨率单位

在输出文件中输入GPS定位值的分辨率单位。如果要用.dgn格式中已有的数据覆盖GPS数据，两个文件的分辨率单位相同是非常重要的。

有两个选项：

  自动 - 分辨率单位由Trimble Geomatics Office项目的文件/项目属性/ 单位和格式标中的坐标十进制数位域自动计算而得到。

  用户定义 - 分辨率单位在野外可由人工设定。

地球起源

选择地球起源的计算方式。如果要用 .dgn 格式中已有的数据覆盖GPS数据，两个文件的地球起源相同是非常重要的。

有两个选项：

  自动 - 地球起源从输入一个（或多个）文件来自动计算而得到。

  用户定义 - 地球起源的X, Y和Z坐标在野外可由人工设定。


导出选项对话框 (GIS导出)

使用此对话框将地理信息系统(GIS)格式的选项编辑为要导出的格式。

要访问此对话框：

1.	选择文件/导出。导出对话框出现。

2.	在GIS标签中，点击选项。

注： 此对话框的选项是否有效取决于所选的导出格式。相应的格式主题描述了这些设置：

  ArcView 文件(*.dbf, *.shp, *.shx)

  AutoCAD带有属性的文件 (*.dxf)

  MapInfo文件(*.mif, *.mid)

  Microstation文件 (*.dgn)

除了各种格式的特有设置，所有格式的共同设置讨论如下。

文件格式

有三种不同的文件格式：

  DOS 格式

如果目标系统在MS-DOS 下运行或包含MS-DOS ASCII 字符串的文字时，选择此项。此格式的文本文件有<CarriageReturn> <NewLine> 记录终止符。

  Windows格式

如果目标系统在Microsoft Windows 操作系统 下运行或包含ASCII 字符串的文字时，选择此项。此格式的文本文件有<CarriageReturn> <NewLine> 记录终止符。

  UNIX 格式

如果目标系统在UNIX操作系统下运行，选择此项。此格式的文本文件有<NewLine> 记录终止符。

注：对于已选的GIS格式，只有有效的文件格式才可使用。

尺度

如果GIS格式支持三维 (3D) 点，则可导出二维 (2D) 点(纵坐标，横坐标)，也可导出三维点(纵坐标，横坐标，高程)。在GIS格式不支持3D点时，此选项无效。

提示： 如果GIS不支持3D点，要导出高程时，点击属性并选择点高程选项。

属性

点击属性选择要与点一起导出的属性。打开属性对话框。使用此对话框配置菜单属性值的导出方式。

注： 在属性对话框中的有效选项与在所有GIS格式中的有效选项相同。


属性对话框(GIS 导出选项)

使用此对话框选择Trimble Geomatics Office中导出文件时要附带的任何其它属性值。这些属性是用数据库中与点一起保存的相应值创建的。在此对话框中，不能自己创建要添加的属性。

属性对话框中的有效选项与所有地理信息系统（GIS）格式中的有效选项相同。

生成属性

选择各导出点要添加的组合选项。这在导出到2D GIS时并且您需要导出高程时是有用的。在要导出到GIS的软件中，任何生成属性都表现为正常属性。

注：生成的日期和时间属性以要素和属性库中使用的最新格式导出。

导出菜单属性

定义要素和属性库 (*.fcl) 文件或数据字典 (*.ddf)文件时，可给每个菜单属性项指定两个代码值。

例如，一个要素码'树'同时具有菜单属性 '类型'。 每个菜单项有一些代码值。类型 'Native'的代码值可以是NV 和NT。采集了属性的带有树要素码的点可将类型属性以实际属性值（如，Native）、'用户码1' (如NV)、或 '用户码2' (如NT) 导出。这在GIS只支持两个字符的属性值时是非常有用的。

关于代码值的更多信息，参见Trimble要素和属性编辑器程序的帮助。


帮助主题命令

使用帮助主题命令可打开在线帮助功能。


每日提示命令

每日提示系统给您提供使用Trimble Geomatics Office的必要帮助。

选择这一命令可以显示当日的下一个提示。

在启动Trimble Geomatics Office时，如果您需要显示提示，请在启动检查框里选择显示提示。


每日提示对话框

每日提示系统给您提供使用Trimble Geomatics Office 的必要帮助。

在启动Trimble Geomatics Office 时，如果您需要显示提示，请在启动检查框里选择显示提示。


关于Trimble Geomatics Office 命令

 如何作 ...

使用这一命令可以显示程序、版权信息以及Trimble Geomatics Office 版本号。


关于Trimble Geomatics Office 对话框

这一对话框显示程序、版权信息以及Trimble Geomatics Office 的版本号。


使用帮助

在您使用 Trimble Geomatics Office 软件时，有几种获得帮助的方法。

从对话框中得到帮助	确认对话框激活，按 F1。
从菜单命令中得到帮助	1. 把光标放在菜单命令上，按下鼠标左键。 2. 按 F1。
用目录在帮助系统中找到主题	选择内容标签，按类别浏览主题。如同读一本书。
用索引在帮助系统中找到主题	选择索引标签，看索引目录表。键入您要找的字词，或在目录表上滚动搜索。
在帮助系统中搜索术语或短语	1. 选择搜索标签。 2. 如果出现查找设置向导，选择最小化数据库尺寸选项，点击下一步>，然后点击完成。 3. 在键入您想查找的域框中，键入您想查找的字词或短语。 4. 如果必要，在选择匹配字词以缩小搜索范围框中，选择一个字词去缩小搜索。 5. 在选择主题显示域框中，选择一个主题。它将显示在帮助窗口的右侧。 提示: 如果重建索引, 选择搜索/选项。
打印帮助主题	要打印当前的帮助主题，进行下列操作之一：  点击打印。  从文件菜单选择打印主题。   用鼠标右键点击帮助窗口内部，然后选择打印主题。 注: 您可以打印单独的帮助主题，但不能打印整个帮助手册。  要打印弹出窗口中的资料，用鼠标右键点击窗口内部，然后点击打印主题。

提示: 在帮助工具条上点击返回，查看您前面看过的主题。


报告注释记录

 概述及更多信息

如果从 Trimble Geomatics Office 项目数据库中报告注释记录，则创建一个自定义数据库报告。自定义报告是在数据库中定义的基本报告类型或查询的基础上作出的。

创建自定义报告需要两个部分：

  定义选择集

  创建报告格式


定义选择集

选择非图形记录类型（例如：注释记录）：

1.	进行下面操作之一：

  用 dc 文件选择集。

  选择选择 / 按查询。

2.	选择记录类型。

注：如果您选择整个数据库，则报告包括数据库中的所有注释。


创建报告格式

方法是：

1．选择报告 / 附加报告。附加报告对话框出现。报告列表给出了当前可用的报告系列。

2．点击新建，创建一个新的报告格式。定义报告格式对话框出现。

3．在名称域中，输入报告名称。

4．在报告域中，选择注释记录。

5.	在格式体域中，进行如下一项操作：

  输入[注释]。

  用快捷菜单选择注释。

缺省的 HTML查看器打开并显示报告。您可以打印或保存报告。


带有点信息的报告注释记录(域中采集的)
报告具有点信息的注释记录 (在现场采集的)

注释记录与 Trimble Geomatics Office 中的点不直接相关。因此，不能用上述概括的过程导出注释记录和点信息（例如：N、E、注释）。但是，可以通过要素代码域导出注释。

方法是：

1.	在.dc 文件中，用 DC 编辑器程序查找 GPS 向量记录 (GPS VEC)。向量记录后面跟一个注释.。

2.	在这些 GPS向量记录域中，转到代码域，并在当前代码之后键入一个破折号，后面跟注释信息。	例如：树 � 松树。

记录导入后，注释记录就加到要素代码域的最后。这个注释便与点建立了关联，使您能够作出报告：

  点、北向、东向、要素代码

注：有时 GPS 向量记录域后面跟一个时间标记和注释记录。在此情况下，时间标记就与要素代码相关，而不是与点相关。您需要删除时间标记记录。


创建自定义点报告

 概述及更多信息

如果从 Trimble Geomatics Office 的数据库报告点记录，则创建一个自定义数据库报告。自定义报告是在数据库中定义的基本报告类型或查询的基础上工作的。


创建自定义数据库报告

1．选择报告 / 附加报告。附加报告对话框出现。报告列表给出了当前可用的报告。

2．点击新建，创建一个新的报告格式。定义报告格式对话框 出现。

3．在名称域中，输入报告名称。缺省的点记录条目出现在关于域的报告中。

4．点击自动填冲格式，Trimble Geomatics Office完成格式头和格式体域的填充。您可以编辑这些格式。

提示：用鼠标右键点击格式头和格式体域，然后选择域，从列表中选择可行的域码。

5.	点击确认。

缺省的 HTML查看器打开并显示报告。您可以打印或保存报告。


改变项目投影中的区域

 概述及更多信息

注意: 区域必须在坐标系统数据库内。

1.	选择文件 / 项目属性。项目属性对话框 出现。

2.	选择坐标系统标签。

3.	在坐标系统设置组中，点击改变。选择坐标系统对话框 出现。

4．选择新系统选项，点击下一步。选择坐标系统类型对话框 出现。

5．选择坐标系统和区域选项，点击下一步。

6．在坐标系统区域组中，突出显示包含所需区域的坐标系统。

7．在区域组中，选择需要的区域，然后点击下一步。选择大地水准面模型对话框出现。

8．进行下面操作之一：

  选择项目所需的大地水准面模型。

  点击大地水准面模型。

9．点击完成。

坐标系统被应用到数据库。数据库中的现有任何点被转换到新的坐标系统。

如果在您的项目中有空高程的点位置、或者输入了空高程坐标，并且项目高程没有被定义，则坐标系统选择将无效。这是因为 Trimble Geomatics Office不能在没有大致高程的情况下，把现有点从一个系统转换到另一个系统。


导出要素和属性库到 Trimble Survey Controller
导出背景地图文件到 Trimble Survey Controller

 概述及更多信息

1.	进行下面操作之一：

  选择文件 / 导出。

  点击导出工具。

导出对话框出现。

2．在测量标签中，选择要素和属性库到测量控制器 (*.fcl) 选项。选择要素和属性库对话框出现。

3.	点击浏览，确定您想导出的 fcl 文件的位置。

4.	选择导出属性检查框，导出包含在要素和属性库中的属性定义。该选项使属性在 Trimble Survey Controller中可用。如果检查框内容被清除，则定义在 .fcl 文件中的任何属性都不能导出。

注：控制码也被导出。

5.	点击确认。数据传输另存为对话框出现。

6．检查设备 (运行 Trimble Survey Controller) 是否连接到计算机上。

7．选择测量控制器设备并点击打开。正在连接对话框出现。

完成连接后，保存对话框出现。

进行下面操作之一：

  选择主内存 (C:) 选项，存储Trimble Survey Controller主内存里的代码库。

  如果插有PC卡，并愿意在PC卡上存储代码库，则选择PC卡 (A:) 选项。

注：如果设备没有 PC 卡，则该对话框不可用。

9．点击打开。您选择的位置被读取，显示目录中所有的要素和属性库文件。要素和属性库的内部名称出现在文件名域中。

10.	如果需要，编辑文件名域，改变 Trimble Survey Controller中的文件名。但计算机上的原始文件名不会改变。

11．点击保存。正在加载对话框出现。行进过程条显示传输的过程。

传输完成后，正在加载对话框消失，到设备的连接断开。

代码库已经被传输。


导出到 GIS 格式

 概述及更多信息

1.	进行下面操作之一：

  选择文件 / 导出。

  在标准工具栏上点击导出工具。

导出对话框 出现。

2.	在 GIS 标签中，选择需要的格式。

3.	要改变导出格式的设置选项，点击选项。这允许您为正在输出的 GIS 格式配置选项。

4.	点击确认。文件名对话框出现。

5.	为新文件指定一个名称，然后点击保存，创建一个（或几个）新文件。


创建组合基准网格 (.cdg) 文件并传输到 Trimble Survey Controller

 概述及更多信息

注：要创建一个新的组合基准网格文件，只能使用当前正用在项目中的基准网格文件。但是，您可以导出组合基准网格。您只能传输组合基准网格文件到 Trimble Survey Controller的版本 7.00 或更高版本。

1.	选择文件 / 导出。 导出对话框 出现。

2.	在测量标签中，选择基准网格到测量控制器 (*.cdg) 选项，点击确认。导出基准网格对话框出现。

3.	为导出选择创建组合基准网格文件到 Trimble Survey Controller 选项。创建组合基准网格对话框出现。

球体上的黄色框定义经度和纬度网格文件覆盖的地区。它们是在创建组合基准网格对话框的右边指定的。

4.	要减小文件大小，使用创建组合基准网格对话框左边的选择工具。从黄色框里面的区域，找出您希望的已创建的组合基准网格，然后拖拉它上面的黑色选择框。

文件大小显示了将被创建的组合基准网格文件的大小，经度和纬度限制表明了将被创建的组合基准网格文件的范围。

5.	测量控制器名称域显示用在Trimble Survey Controller工作中的划分为子网格的组合基准网格。如果Trimble Survey Controller已经使用了同名的基准网格，则给这个名称加一个后缀或前缀。名称必须包含初始基准网格名。

注：在导入测量控制器 （*.dc）文件期间，Trimble Geomatics Office使用测量控制器名称域去检查用在域内的 .cdg 文件名是否与Trimble Geomatics Office项目定义的基准网格对应。如果名称不对应，则基准网格将不被识别。

6.	点击确认。

文件名对话框出现。缺省文件名是基准网格名称的前6个字符。它不是用在Trimble Survey Controller 中的名称，而是 .cdg 文件名，要存储到程序文件\公共文件\Trimble\GeoData目录中。

7.	如果要给文件指定一个替代名，用键盘编辑该文件名域，然后点击保存。数据传输另存为对话框 出现。

8.	选择测量控制器设备，点击打开。正在连接对话框出现。完成连接后，保存对话框出现。

进行以下操作之一：

  选择主内存 (C:) 选项，把文件存储到 Trimble Survey Controller的主内存里。

  如果有插入的PC卡，并希望在该PC卡上存储文件，则选择 PC卡 (A:) 选项。

注：如果您的 Trimble 设备没有 PC卡，该对话框不可用。

10.	点击打开。

选择的目录被阅读。目录里的全部组合基准网格文件都被显示出来。文件名域不可用。它将显示出现在Trimble Survey Controller中的组合基准网格名称。

11．点击保存。正在加载对话框出现，行进条显示传输的行进过程。传输完成后，正在加载对话框消失，与设备的连接断开。

现在您能够在Trimble Survey Controller中使用该文件。


划分子格网并传输大地水准面格网 (.ggf) 文件到 Trimble Survey Controller
划分子网格并传输大地水准面网格 (.ggf) 文件到 Trimble Survey Controller

 概述及更多信息

注：您只能传输大地水准面网格文件到Trimble Survey Controller版本6.00 或更高版本。

1.	选择文件 / 导出。导出对话框 出现。

2.	在测量标签中，选择大地水准面文件到测量控制器 (*.cdg) 选项，点击确认。导出大地水准面模型对话框 出现。

3.	要创建一个新的大地水准面网格文件，选择创建大地水准面模型子网格并导出到测量控制器选项，然后点击确认。创建大地水准面网格文件对话框出现。

注：选择导出现有大地水准面网格文件到测量控制器选项，从而导出一个现有的此类文件。

球体上的黄色框定义大地水准面模型覆盖的地区。这个大地水准面模型和大地水准面网格文件是在创建大地水准面网格文件对话框的右边指定的。如果大地水准面模型覆盖了全世界，则将看不到黄色框。

4.	要减小文件大小，使用创建大地水准面网格文件对话框左边的选择工具。从黄色框里面的域，找出您希望的已创建的大地水准面网格文件，然后拖拉它上面的黑色选择框。

文件大小显示了将被创建的大地水准面网格文件的大小，经度和纬度限制表明了将被创建的大地水准面网格文件的范围。

5.	名称域显示用在Trimble Survey Controller工作中的划分为子网格的大地水准面模型。如果测量控制器已经使用了同名的大地水准面模型，则给这个名称加一个后缀或前缀。该名称必须包含初始大地水准面模型名。

注：在导入测量控制器 （*.dc）文件期间，Trimble Geomatics Office用名称域去检查用在域内的 .ggf 文件名是否与Trimble Geomatics Office项目定义的大地水准面模型对应。要确认文件名包含初始大地水准面模型名，否则大地水准面模型将不被识别。

6.	点击确认。

另存为对话框出现。缺省文件名是大地水准面模型名称的前6个字符。这不是用在Trimble Survey Controller 中的名称，它是大地水准面网格文件名，将被存储到程序文件\公共文件\Trimble\GeoData目录中。

7.	如果要给文件指定一个替代名称，用键盘编辑该文件名域，然后点击保存。数据传输另存为对话框 出现。

8.	选择测量控制器设备，点击打开。正在连接对话框出现。当完成连接后，保存对话框出现。

9.	进行下面操作之一：

  选择主内存 (C:) 选项，把文件存储到 Trimble Survey Controller的主内存里。

  如果您有插入的PC卡，并希望在该PC卡上存储文件，则选择 PC卡 (A:) 选项。

注：如果您的 Trimble 设备没有 PC 卡，该对话框不可用。

10.	点击打开。

选择的目录被阅读。目录里的全部大地水准面网格文件都被显示出来。文件名域显示出现在测量控制器中的大地水准面网格名称。当用该文件传输 .dc 文件到 Trimble Geomatics Office中时，这个名称用来匹配大地水准面网格名。

11.	点击保存。正在发送对话框出现，行进条显示传输的行进过程。传输完成后，正在发送对话框消失，与设备的连接断开。

现在可以在Trimble Survey Controller中使用该文件。

注：您也能够用 Trimble Grid Factory程序去划分子网格大地水准面模型文件。Grid Factory 是安装软件时 Trimble Geomatics Office 自定义选项的一个部分。

注：如果您正与 Trimble Survey Controller 版本 7.60 来回传输数据，则采用版本 7.50 .dc 文件格式。


划分子网格并传输大地水准面网格（.ggf）文件到TDS Survey Pro CE CE软件

 概述及更多信息

注：只能把大地水准面网格文件传输到TDS Survey Pro CE 软件版本4或更高版本。

1.	选择文件/导出。导出对话框出现。

2.	在测量标签中，选择大地水准面文件到TDS Survey Pro CE (*.ggf) 选项，点击确认。导出大地水准面模型对话框出现。

3.	要创建新的大地水准面网格文件，选择创建导出的大地水准面模型子网格选项，点击确认。创建大地水准面文件对话框出现。

注：选择导出现有大地水准面网格文件选项，导出本类现有文件。

地球上的黄色框定义由大地水准面模型覆盖的面积。创建大地水准面网格文件对话框的右侧指定大地水准面模型和大地水准面网格文件。如果大地水准面模型覆盖了世界，则看不见黄色框。

4,	为了减小文件的大小，使用创建大地水准面网格文件对话框左边的选择工具。把黑色选择框拖进您想创建大地水准面网格文件的黄色框内的面积上。

被创建大地水准面网格文件的大小，由文件的大小显示。经度和纬度的限定由尺度范围显示。

名字域显示已用的划分为子网格的大地水准面模型的名字。

注：在文件导入期间，Trimble Geomatics Office检查名字域中所用的 .ggf文件的名字是否与Trimble Geomatics Office项目中定义的大地水准面模型相匹配。请确认文件名包含原始的大地水准面模型名，否则，大地水准面模型不被认可。

6.	点击确认。

另存为对话框出现。缺省的文件名是大地水准面模型名称的前6个字符。它是将在程序文件\公共文件\Trimble\GeoData目录中存储的大地水准面名称。

7.	如果要为文件指定一个交替名称，用键盘编辑文件名域，点击保存。数据传输另存为对话框出现。

8.	选择 TDS Survey Pro CE设备，点击打开。正在连接对话框出现。连接妥当后，保存对话框出现。

9.	传输文件到TDS Survey Pro CE设备。

现在便可以在TDS Survey Pro CE软件中使用文件。

注：也可以把网格工厂程序用到子网格大地水准面模型文件。网格工厂是安装软件中Trimble Geomatics Office自定义选项的一个部分。


使用 TRIMMAP 软件数据

您能从 TRIMMAP 软件创建的工作中导入数据到 Trimble Geomatics Office。

1.	从 TRIMMAP 软件打开您希望用 Trimble Geomatics Office处理的工作。

2.	选择工具 / 导入 / 导出 / 图形接口。图形接口菜单出现。

3.	选择图形接口 / 创建文件。

4.	输入工作名和输出文件名。

注：在输出文件名域中，确保您为即将创建的文件指定了名称和位置，并提供了 .tgf 扩展。	例如： C:\Temp\Topo_pts.tgf

5.	在 Trimble Geomatics Office中，选择文件 / 导入。导入对话框出现。

6.	在CAD / ASCII标签中，选择TRIMMAP图形文件选项，点击确认。选择文件对话框出现。

7.	导航到包含 .tgf 文件的文件夹，点击打开。

文件导入到 Trimble Geomatics Office。


创建新的查询

警告：只有当用户使用 Trimble 拥有的Trimble Geomatics Office时，Trimble Navigation Limited才支持对该数据库的使用或修改。如果该数据库使用其它软件应用程序，Trimble 将不支持、不授权使用、或不负责修改。Trimble可以随时修改该数据库的格式，使它不与其它软件应用程序兼容。

 概述及更多信息

注：如果要定义自定义查询，则需要 Microsoft Access 2000 (或更高版本) 软件。

本例列举了创建查询，它选择了空高程的所有数据库点。

1.	在 Microsoft Access 中，打开要增加查询的 Trimble Geomatics Office模板（或项目）数据库。这可以从模板或项目的文件夹 (.mdb) 中找到。

2.	在主图形窗口选择查询，然后点击新建去创建新的查询。

提示：选择设计视图选项，而不是查询提示选项。

3.	在显示表格对话框中，选择点表格。这是因为您希望选择点要素，它们都存储在该表格中。

4.	选择关闭对话框前，点击增加。

查询对话框出现。

5.	把查询定义中的第一列设置到全部点表格。具体方法是：从查询对话框上部的点表格中，拖放 * 标识，或从域框选择点 .*。

注：显示检查框为缺省选项。通常它返回到全部表格，除非查询选择了多重元素。这样，查询能被用于其它目的（例如：作报表）。

6.	把第二列中的域设置到高程（高程域标识）。

在该列中的指标域中，Enter =0。这为空高程值设置了检查。

7.	为了测试该查询的功能，检查数据表视图。数据库里任何零高度的点都列在表中。

8.	要保存新的查询，关闭并用前缀“Select_”命名。例如，把它命名为“零高程Select_Points”。

注：如果要增加查询到属性窗口选择工具上，则排序工具用前缀“SortSS”、筛选工具（用于测量数据）用前缀“SvyFilterSS_”、以及筛选工具（用于CAD数据）用前缀“PlanFilterSS_”。如果把查询用在自定义报表，则用前缀 揜eport_�。

9.	新的查询在选择 / 按查询选项中（以及Trimble Geomatics Office内的其它地方）生效之前，数据库概略文件必须更新。用 Microsoft Windows Explorer为项目（或样板项目）删除现有数据库概略文件（.dbs）。

注：当打开一个没有数据库概略文件的项目时，Trimble Geomatics Office将根据数据库文件的配置自动创建一个新的概略文件。这个新的概略文件包括对新加查询的参考。新的查询出现在选择 / 按查询中。您可以把它用在自定义的ASCII导出和报告定义中。

10.	打开 Trimble Geomatics Office，并打开增加了查询的模板或项目。

现在可以通过挑选选择 / 按查询进行新的查询。您的新查询出现在列表中。


从 Trimble Survey Controller 软件导入测量控制器 (*.dc) 文件
从 Trimble Survey Controller导入测量控制器 (*.dc) 文件

 概述及更多信息

1.	选择文件 / 导入。导入对话框出现。

2.	在测量标签中，选择测量设备选项，点击确认。数据传输打开对话框出现。

3.	选择测量控制器设备并点击打开。正在连接对话框出现。

实现了连接后，打开对话框的域中看改变到测量控制器设备。

进行下面操作之一：

 如果正在导入的文件是在 Trimble Survey Controller的主内存里，则选择主内存 (C:) 选项。

 如果有插入的PC卡，并希望导入文件到该PC卡上，则选择 PC卡 (A:) 选项。

 	注：如果 Trimble 设备没有 PC卡，该对话框不可用。

5.	点击打开。选择的目录被阅读。目录里的全部 Trimble Survey Controller 工作都被显示出来。

6.	在文件格式域中，选择正在使用的数据控制器文件版本。

7.	选择您希望导入的文件，点击打开。下载对话框出现，行进条显示文件传输的行进过程。传输完成后，下载对话框消失，与设备的连接断开。

工作文件已经被转换到 .dc 文件并且导入到数据库。该 .dc 文件位于项目的数据文件\Trimble 文件的文件夹中。

注：当您从运行 Trimble Survey Controller的设备传输一个 .dc 文件到 Trimble Geomatics Office时，它是自动导入到项目中的。

注：如果您与Trimble Survey Controller 版本 7.60 来回传输数据，则采用版本 7.50 .dc 文件格式。


在您的计算机上导入 Trimble GPS 数据 (.dat) 文件
在计算机上导入 Trimble GPS 数据 (.dat) 文件

1.	选择文件 / 导入。导入对话框出现。

2.	在测量标签中，选择 GPS 数据 (*.dat) 文件选项并点击确认。打开对话框出现。

3．确定要导入的 .dat 文件，点击打开。DAT Checkin 对话框出现。

4.	进行任何必要的更改。

特别地，要检查天线高度值的正确性。改变任何值都不改变 .dat 文件中的实际值，它只改变在Trimble Geomatics Office中导入文件的数值。这可保持 .dat 文件在它初始的状态。

5.	点击确认。

导入的文件位于项目的数据文件\Trimble 文件的文件夹中。

提示：您可以拖放 文件。


从Trimble GPS 接收机导入 Trimble GPS 数据 (.dat) 文件

 概述及更多信息

1.	选择文件 / 导入。导入对话框出现。

2.	在测量标签中，选择测量设备选项并点击确认。数据传输打开对话框出现。

3．选择GPS 接收器设备，点击打开。正在连接对话框出现。

实现了连接后，打开对话框的域中看改变到GPS接收器设备。

4．选择您希望导入的文件，点击打开。正在下载对话框出现，行进条显示文件传输的行进过程。

传输完成后，正在下载对话框消失，与 GPS 接收器的连接断开。

DAT Checkin 对话框出现。

5.	进行任何必要的更改。

特别要检查天线高度值是否正确。改变任何值都不改变 .dat 文件中的实际值，只改变在Trimble Geomatics Office中导入文件的数值。这可保持 .dat 文件在它初始的状态。

6.	点击确认。

导入的文件已放在项目的数据文件\Trimble 文件的文件夹中。


导入 RINEX GPS 数据文件

 概述及更多信息

1.	选择文件 / 导入。导入对话框出现。

2.	在测量标签中，选择 RINEX 文件选项并点击确认。打开对话框出现。

选择您想导入的观测文件。必要时，改变类型文件选项。点击打开。

如果有相同名称的对应 .nav 文件，它会自动与观测文件链接。如果没有相同名称的对应 .nav 文件，导航文件匹配对话框出现。观测文件列在观测文件下面。选择适当的.nav文件，点击确认。

注：每个观测文件都必须有对应的.nav文件。如果正确的.nav文件没有被选择，信息将出现于导入上，并且基线不能被处理。

4.	文件转变到 Trimble GPS 数据文件格式。DAT Checkin对话框出现。

5.	进行任何必要的更改。

特别要检查天线高度值和接收器类型是否正确。改变任何值都不改变 GPS 数据文件中的实际值，只改变在Trimble Geomatics Office中导入文件的数值。这可保持 GPS 数据文件在它初始的状态。

提示：要确保在 dat check-in 上接收器和天线类型未知。

6	点击确认。

导入的文件位于项目的数据文件\Trimble 文件的文件夹中。


创建自定义导入 / 导出格式

 概述及更多信息

本例定义了自定义的导出格式。格式是以逗号定界的文本文件，包括点名称（大写字母）、北向（有单位）、东向（有单位）和高程（有单位）。域码用来选择所需的域。自定义导入格式以类似的方法定义。

1.	选择文件 / 导出。导出对话框出现。

2.	在自定义标签中，点击新建。定义 ASCII 导出格式对话框出现。

3.	在名称域中，输入名称。

4.	用鼠标右键点击格式体域，从快捷菜单中选择域/名称。

[名称] 在格式体框中出现。

5.	用鼠标右键点击快捷菜单并选择域 / 高级的 / 改变量/ 大写字母。

[名称：大写字母] 在格式体框中出现。这意味着全部点名称都将以大写字母导出。

6.	输入逗号，后接空格。

7.	用鼠标右键点击快捷菜单并选择域 / 北向。

[北向] 在逗号旁出现。

8.	用鼠标右键点击快捷菜单并选择域 / 高级的 / 改变量/ 单位。

[北向] 改变为 [北向:单位]。这意味着当前坐标单位包括在文件中。

9.	输入逗号，后接空格。

10.	用鼠标右键点击快捷菜单并选择域 / 东向。

[东向] 在逗号旁出现。

11.	用鼠标右键点击快捷菜单并选择域 / 高级的 / 改变量/ 单位。

 	[东向] 改变为 [东向:单位]。这意味着当前坐标单位包括在文件中。

12.	输入逗号，后接空格。

13.	用鼠标右键点击快捷菜单并选择域 / 高程。

 	[高程] 在逗号旁出现。

14.	用鼠标右键点击快捷菜单并选择域 / 高级的 / 改变量/ 单位。

[高程] 改变为 [高程:单位]。这意味着当前坐标单位包括在文件中。

15.	点击确认保存导出格式。导出对话框出现。您创建的格式出现在自定义标签中的一览表内。

16.	要在该格式中导出数据，选择格式并点击确认。另存为对话框出现。

17.	在文件名域中，为导出文件输入名称，点击保存去创建文件。


导出测量控制器 (*.dc) 文件到 Trimble Survey Controller

 概述及更多信息

1.	选择文件 / 导出。导出对话框出现。

2.	在测量标签 中，选择测量设备选项。

3.	点击选项，为文件指定工作设置。

4．在出现的对话框中，点击确认，接受任何更改，然后返回到导出对话框。

5.	点击确认。数据传输另存为对话框出现。

6.	选择Trimble Survey Controller 设备并点击打开。正在连接对话框出现。

7.	实现了连接后，保存对话框出现。

8.	进行下面操作之一：

  选择主内存 (C:) 选项，存储文件到 Trimble Survey Controller的主内存里。

  如果有插入的PC卡，并希望导入文件到该PC卡上，则选择 PC卡 (A:) 选项。

注：如果 Trimble 设备没有 PC 卡，该对话框不可用。

9.	点击打开。

选择的文件夹被阅读。文件夹里的所有测量控制器文件都被显示了出来。Trimble Geomatics Office 项目名称出现在文件名域中。这是 Trimble Survey Controller工作的名称，将导出到 Trimble Survey Controller。必要时，可以编辑这个名称。

10.	点击保存。正在上载对话框出现，行进条显示传输的行进过程。传输完成后，正在上载对话框消失，与设备的连接断开。

现在您可以使用 Trimble Survey Controller中的文件。

注：如果与 Trimble Survey Controller 版本 7.60 来回传输数据，则采用版本 7.50 .dc 文件格式。


导出 AutoCAD (*.dxf) 文件

 概述及更多信息

1.	选择文件 / 导出。导出对话框出现。

2.	在 CAD / ASCII 标签中，选择 AutoCAD (*.dxf) 选项。

3	点击选项，配置您希望导出的 .dxf 版本和类型。

4	点击确认。另存为对话框出现。

5.	导航到您想保存文件的文件夹。

6.	给文件输入名称，点击保存。

文件已被创建。

作为缺省，Trimble Geomatics Office导出点名称为点的属性。如果要导出有关该点的其它资料，在选项.ini文件中编辑 DXF/DWG 属性块定义。

注：您可以用这些步骤导出绘图 (*.dwg) 文件。在步骤 4，点击选项来配置 .dwg 格式和版本。


改变项目的单位

 概述及更多信息

1.	选择文件 / 项目属性。项目属性 对话框出现。

2.	在单位和格式标签中，选择您希望改变单位和格式的域。

3.	从列表中选择所需的选项，点击确认确定此改变。


设置属性的项目
建立属性的项目

 概述及更多信息

1.	选择文件 / 项目属性。项目属性对话框出现。

2.	在要素标签中，选择使用属性检查框。库域便可用。

3.	点击浏览，确定所需的要素和属性库文件 (*.fcl) 或数据字典 (*.ddf) 文件。

4.	点击确认。所选择的文件用于为具有属性的每个要素代码创建数据库报表。现在您可以导入具有属性的 .dc 文件。


选择已保存站点为项目坐标系统

 概述及更多信息

1.	选择文件 / 项目属性。项目属性对话框出现。

2.	选择坐标系统标签。

3.	在坐标系统设置组中点击改变。选择坐标系统对话框出现。

4.	选择新系统，点击下一步。选择坐标系统类型对话框出现。

5.	选择已校正点，点击下一步。选择已校正点对话框出现。

6.	选择您需要的站点，点击完成。

坐标系统已被应用到数据库。数据库中的任何现有点都转换到了新的坐标系统。关于转换过程的资料，参见主题坐标系统概述 。

如果在您的项目中有空高程的点位置、或者输入了空高程坐标，并且缺省高程没有被定义，则坐标系统选择将会无效。这是因为 Trimble Geomatics Office不能把现有点从一个系统转换到另一个系统。


导出属性

 概述及更多信息

您可以导出包含下列内容的文件：

  具有指定要素的所有点

  所有属性

如果要为每个要素导出独立的文件：

1.	选择包含有关要素的点。

2.	配置自定义导出格式。


选择包含有关要素的点

进行下列操作：

1.	从平面视图挑选选择 / 按点要素。例如：如果您想报告所有的树属性，在按点选择要素对话框中选择“树”。

2.	点击确认。您指定的具有要素代码的所有点都被选择。


配置自定义报告格式

进行下列操作：

1	选择文件 / 导出。导出对话框出现。

2	在自定义标签中，点击新建。定义 ASCII 输出格式对话框出现。

3.	在名称域中，输入导出格式的名称。

4.	在描述域中，输入导出格式的描述。描述不是格式的强制内容。

5.	确认点信息是在从域的导出中选择出来的。这是因为您正在对点作报告。

6.	点击自动填充格式，填充到所有的域中，从点表格到格式头和格式体。

7.	在出现的插入格式对话框 中，选择格式所需要的合适的定界符。

8.	删除您不想包括在格式里的任何格式头和域。

9.	在格式头列表中，增加您想包括在格式里的任何属性标题。

10.	属性记录不存储在点表格中。从相应的要素表格增加要包括在格式内的域。为了进入这些域，用鼠标右键点击格式体列表，并从快捷菜单选择。

11.	选择域 / 高级的 / 属性。带属性的全部要素代码（在要素和属性库中用来为属性设置项目）都出现。

12.	选择您已经选过的相同要素代码（例如“树”）。属性出现于进一步的子菜单中。

13.	点击您想报告的属性。所选择的属性出现在格式体框中。

注：如果您想报告一个特别要素的所有属性，则从快捷菜单中选择星号 (*) 选项。所有属性都被加到格式体中。

14.	为您想导出给文件的每个属性重复上述操作。

15.	导出格式完成，点击确认。格式被加到自定义列表中。

16.	 如果要在该格式中导出文件，突出显示格式，点击确认。


导出具有所有属性的单一文件

进行下列操作：

1	选择文件 / 导出。导出对话框出现。

2.	在GIS标签中，选择名称、纬度、经度、高度和所有属性（地区的）选项，或者名称、北、东、高度和所有属性选项。

3.	点击确认。

4.	保存对话框出现。输入文件名和位置，点击确认。

一个包含属性的文件就被创建。


导入具有属性的测量控制器 (*.dc) 文件

 概述及更多信息

注：如果要在 Trimble Geomatics Office中使用属性，您必须首先为属性设置项目。

1.	选择文件 / 导入。导入对话框出现。

2.	在测量标签中，选择测量控制器文件 (*.dc) 选项，点击确认。

Trimble Geomatics Office检查在当前Trimble Geomatics Office项目中指定的要素和属性库（*.fcl）文件、或者数据词典（*.ddf）文件是与 .dc的文件之一相同。

如果它们不同，您有下列选择：

  删除导入。

  导入所有点和被当前Trimble Geomatics Office项目确认的属性信息。您被警告您可能丢失数据。导入报告描述了不被导入的属性信息。

  只导入点（不导入属性信息）。

如果要素和属性库没有定义在当前Trimble Geomatics Office项目中，您可以导入没有属性信息的 .dc文件，或者删除导入。

注：如果您在来回从 Trimble Survey Controller 版本7.60 传输数据，则使用版本7.50 dc文件格式。


增加图层

 概述及更多信息

1.	从平面视图进行以下操作之一 ：

  选择编辑 / 图层。

  点击编辑图层工具。

图层对话框出现。

2.	点击新建。新的行出现于图层对话框中。

3.	在名称域中，输入新图层的唯一名称。

4.	从列表中选择缺省点形式。这个点形式用于<按图层>选择了点形式域的所有点。

5.	从列表中选择缺省线形式。这个线形式用于<按图层>选择了线形式域的所有线段、弧段和曲线。

6.	从列表中选择文本形式。这个文本形式用于<按图层>选择了文本形式域的所有文本形式 。

7.	如果您想显示图层中的所有元素，则选择可见检查框。

8.	清除锁定检验框，激活图层中被选择的元素。

9.	点击确认。


合并重复名称的点
合并重名点

 概述及更多信息

如果您知道重复点是相同的物理点，并且不需要他们是分离的点，那么可以在Trimble Geomatics Office中合并这些重复点。

注意：带有相同名称却又明显不同数据的点可能是错误的结果。合并它们可能会产生意外结果。

1.	确认点是相同的物理点。为此，挑选选择 / 重复点 / 按名称和距离。

2.	输入差距距离，点击确认。

3.	选择编辑 / 合并重复点。

Trimble Geomatics Office把所有的观测值合并到点并为这些点键入位置。状态栏显示合并操作的总结。


指定重复点如何在导入上管理
指定重复点在导入中的管理方法

 概述及更多信息

Trimble Geomatics Office缺省地合并导入中带有相同名称的点，所以不创建重复点。在重复点选项对话框里，您可以指定软件在什么水平和 / 或垂直限差范围内能够合并点，或者指定软件在导入上完全不解决这种问题。

1.	选择文件 / 导入。导入对话框出现。

2.	点击选项。重复点选项对话框出现。

进行如下一项操作：

  确认选择了总是合并重复点选项。

  选择限差选项范围内的合并重复点，输入适当的限差。

  如果要指定软件不解决导入上的重复点，选择合并重复点选项，并输入水平限差值 0.02（即水平测量质量限差）和垂直限差值0.050（即垂直测量质量限差）。

注意：如果不指定限差（即：在限差组中，不选择水平和垂直检查框），重复点就将被合并。

注意：如果把限差设置到0.000，则合并点的重复点坐标必须准确地相同。

这些设置适用于所有的导入选项。无论在导入文件时使用的是项目栏、或是把文件拖放到 Trimble Geomatics Office 项目里，软件都采用您最后指定的重复点设置。


重新命名重复点
重命名重复点

 概述及更多信息

用这个方法重新命名重复点。例如：野外的两个测量组在单独测量控制器(*.dc)文件内对不同的点使用了相同的名称时。步骤如下：

1.	导入从重复点选项对话框中选择的、在限差选项范围内使用合并重复点的文件，设置水平限差到0.02、垂直限差到0.050。

注：如果在已经导入数据后才意识到有重复点，则撤消导入操作。在重复点选项对话框中设置限差选项范围内的合并重复点到水平限差0.02（即水平测量质量限差）、垂直限差0.050（即垂直测量质量限差），然后重新导入数据。

2.	选择已增加重复点到数据库的测量控制器（*.dc）文件。或者，挑选选择 - 重复点 - 按名称。

3.	选择编辑 / 重命名。重命名对话框出现。

4.	在选择项中输入第一个点的新名称。

Trimble Geomatics Office重新命名选择集内的所有点。点的重新命名是根据分配到集的起始值作的。

例如，假设您有五个已选的点。如果用“2000”代替第一个名称，其余四个名称就会依次重新命名为 2001、2002、2003和2004。


用自定义标记标注点

 概述及更多信息

本例用点描述的自定义标记对点作标识。

1.	用 Microsoft Windows Explorer为项目模板或您想增加自定义标记选项的项目确定选项.ini 文件的位置。

2.	用文字编辑器打开选项 .ini 文件。

3	寻找标题：

[标记]

4.	在最后一个标记选项之后，用键盘输入下列文字：

|X|[Y]

其中：‘X’定义给点作标识的标记名称、‘Y’定义域码。

5.	打开 Trimble Geomatics Office里的项目模板或项目。

6.	选择视图 / 点标记。带有对话框的点标记出现，并且新选项添加到了列表中。

7.	选择您需要的选项，点击确认。


注释元素

 概述及更多信息

1.	选择您想注释的选择点、线或弧 。进行下面操作之一：

  鼠标

  选择菜单

2.	选择插入 / 注释。 注释对话框出现。

3.	从列表中选择您需要的模板。

4.	要编辑注释模板，点击模板。

  要保留目前的注释，选择保留现有注释检查框。

  要在应用新注释之前除掉现有的注释，清除保留现有注释检查框。

5.	如果您已经选择了一组元素去注释，检查那个注释组被设置到选择上。

如果您想注释全部数据库，选择全部数据库选项。

如果没有元素被选到，则注释组不可用、全部数据库将被注释。

6.	点击确认，应用注释。

注释被加到了数据库并出现于图形窗口。


创建选择集

 概述及更多信息

1.	选择您希望包括在选择集内的选择元素 (点、线段、观测值、曲线、弧、文字、注释)。具体操作步骤是：

  鼠标

  选择菜单

2.	选择选择/选择集/保存。保存对话框出现。

3.	输入选择集的名称，点击确认。

选择了选择 / 选择集 / 恢复时，选择集就出现于已保存的选择集列表里。选择了选择 / 选择集时，它也出现在最近用过的选择集中。

提示：用查看筛选来查看选择集。


执行 GPS 点校正

 概述及更多信息

您可能需要因下列任何一项原因在 Trimble Geomatics Office中执行对 GPS 的点校正：

  要传输校正到Trimble Survey Controller

  您未曾在域中执行校正

  为质量控制记录创建报告

  把额外的点添加到Trimble Survey Controller中执行的校正上


准备执行 GPS 点校正

执行 GPS 点校正之前，需要确认您对每个校正点都有从地面（网格）或 GPS 数据（WGS-84）推导出的坐标。

如果已经在Trimble Survey Controller中执行了校正，并且网格点和 GPS 点有相同的名称，那么这些点可能已经在导入上被合并了。如果选择在 Trimble Geomatics Office中执行 GPS 点校正，已合并的点将自动分离。这种情况发生时，一条信息将通知您：相同的名称已经用于软件中的 GPS 和网格点内。

进行下列操作之一：

  点击是，创建在数据库中具有相同名称的 GPS 点和分离的网格点。

  如果不想执行 GPS 点校正，或者想人工破除点，点击删除。如果人工破除点，您将得到选项去重命名GPS 点。


执行 GPS 点校正

1.	选择测量 / GPS点校正。 GPS 点校正对话框出现。

2.	在校正组成组中，选择您想计算的校正参数。

3.	点击点列表。点列表对话框出现。

4.	用点列表对话框为校正选择点对（GPS 点和网格点）。它可能是相同的点或具有相同的名称的不同点，只要能找到分离的 GPS 和网格值。

5.	用校正中需要的第一个 GPS 点，进行以下操作之一 ：

 用填充域选择点。

  用键盘输入点的名称。

一个框出现在图形窗口中的 GPS 点上。

注：如果您有相同名称的对应网格点，点列表就被自动填充。

6.	要输入选择的、与 GPS 点相关的网格点，进行以下操作之一 ：

  用填充域选择点。

  用键盘输入点的名称。

一个十字形出现在图形窗口内的网格点上，并且在点列表对话框里加入了一个新列表。

如果被选点有水平的或垂直的坐标组成（或者两者都有），类型域将更新指示。如果没有共同的坐标组成，类型被显示为无效的，坐标不被使用。

7.	重复上面两个步骤，选择在校正中需要的所有点对。

8.	当选择了所有点对后，点击关闭返回到 GPS 点校正对话框 。

注：校正统计在点对话框的底部出现，在输入有效的点对后将被计算出来。用这些统计来识别不正确的点对。

9．点击计算，计算校正参数。校正结果出现在校正总结组中。

10.	如果结果在预期范围之外，则用 GPS 点校正报告来检查点对间大的残差。点击报告，产生 GPS 点校正报告。报告在缺省HTML查看器中显示。

11.	在 GPS 和报告的已知坐标段之间的残差差分中检查残差。如果必要，删除任何可疑的点对，重新应用校正。

12.	点击确认，把校正应用到项目中。

坐标系统已被校正参数更新。


处理要素代码

 概述及更多信息

1.	选择选择 / 选择集 / 恢复。恢复对话框出现。

2.	选择包含要素代码的要处理的同名文件的选择集。当导入  文件时，它被自动创建，并且对域中采集的点有一个顺序记录。使用这个选择集，能够确保要素代码按正确的顺序处理。

3.	选择工具 / 处理要素代码。处理要素代码对话框出现。

4.	选择您需要处理要素代码的库，点击确认。

Trimble Geomatics Office能够处理要素代码。处理过的要素代码出现于图形窗口。


查看反算

 概述及更多信息

确定两个项目点间的反算：

1.	选择测量 / 反算。反算对话框出现，指针成为域填充指针。

2.	点击反算需要的第一个点。点名称出现在反算对话框中的从域。

3.	点击反算需要的第二个点。当把鼠标放到一个点上时，出现虚线。

点名称出现在反算对话框中的到域里，反算值自动显示在反算组中。

注：如果您用键盘在域里输入点，点击计算进行反算计算。

4.	点击详细的，查看有关该反算的附加信息。细节组附加到对话框的底部，并显示有关反算的附加信息。

5.	点击发送到报告，产生有关反算的报告。简短的或详细的报告将根据采用的显示选项（简短的或详细的）被创建。

6.	点击显示报告，查看 HTML 查看器中的报告。

7.	为了查看另一个反算，在点域中点击并重新选择点。


测量区域

用观测工具查看方位角和距离，这里所述的方位角和距离是指在被选的最后两个位置和由当前观测操作中被选的位置创建的区域之间的方位角和距离。

1.	选择测量 / 观测。观测对话框出现。

2.	在图形窗口中点击第一个位置（这个位置不必是点）。

3.	继续在图形窗口中点击位置。您每次选择一个位置，坐标就被用来计算观测对话框域。一条连接您已选位置的线出现。

您每次点击一个新的位置，观测对话框里的域就被更新。这些值不存储在数据库中。

4.	点击复位，清除这些值。


执行坐标转换

 概述及更多信息

用坐标转换平移和／或旋转选择的点。本例举出了通过输入现有点的已知坐标，在数据库中进行转换的方法。

1.	选择您想转换或旋转的点。

2.	选择测量 / 坐标转换。坐标转换对话框出现。

3.	点击点列表。坐标转换 - 点列表对话框出现。

4.	进行如下一项操作：

  在点域中，输入现有的点名称。

  用填充域选择点。

点域、当前北偏域、和当前东偏域被填充，并且已知北偏域被选择。

5.	在已知北偏和已知东偏域中，进行如下一项操作：

  输入点的已知北偏和东偏。

  用填充域选择点的已知北偏和东偏。

一条线出现在图形窗口中，显示当前和已知坐标之间的差异。

统计组显示比例因子和最大水平残差，这些可用来识别不良点对。

6.	点击确认，显示残差误差的对话框出现。

7.	坐标转换对话框返回，北平移量和东平移量的域里填充了从当前和已知坐标计算出来的数值。

8.	点击确认，把坐标转换应用到整个数据库。

注：您可以撤消坐标转换。


执行高程平差

 概述及更多信息

用高程平差调节已选点的高程。本例举出了通过输入现有点的已知高程，调节数据库中所有点高程的方法。

1.	选择测量 / 高程平差。高程平差对话框出现。

2.	点击点列表。高程平差点列表对话框出现。

3.	进行如下一项操作：

  在点域中，输入现有的点名称。

  用填充域选择点。

一个框出现在所选点的上方。

点域、当前北偏域、和当前东偏域被填充。

4.	进行如下一项操作：

  在已知高程域中，输入点的已知高程。

  用填充域选择另一个点的高程。

统计组显示比例因子、最大平差残差和最大垂直残差。这些可用来识别不良点对。

5.	点击确认，返回到高程平差对话框。

北原点域和东原点域里填充了用过的第一个点的坐标。改正常量域用计算出的高程平差填充。如果用来定义高程平差的点多于一个，则只填充改正每单元北方向域和改正每单元东方向域。

6.	点击确认，把高程平差应用到整个数据库。

注：您可以撤消高程平差。


使用域码

 概述及更多信息

使用域码显示如下数值：

  域

  注释中的变量、报告、导出格式、文本

域码也用来定义报告并导出格式。本例举出了用域码定义导出格式的方法。格式定义了包含点名称（大写字母）、北向（有单位）、东向（有单位）和高程（有单位）的用逗号定界的文本文件。

1.	选择文件 / 导出。导出对话框 出现。

2.	在自定义标签中，点击新建。定义 ASCII 导出格式对话框出现。

3.	在名称域中输入名称。

4.	用鼠标右键点击格式体域，并从快捷菜单中选择域 / 名称。

[名称] 在格式体框中出现。

5.	点击鼠标右键进入快捷菜单，然后选择域 / 高级的 / 改变量/ 大写字母。

[名称：大写字母] 出现在格式体框中。这意味着所有的点名称都将用小写字母导出，不论点名称使用的是什么字母。

6.	输入逗号，后面跟一个空格。

7.	点击鼠标右键进入快捷菜单，然后选择域 / 北向。

[北向] 出现在逗号旁。

8.	点击鼠标右键进入快捷菜单，然后选择域 / 高级的 / 改变量 / 单位。

[北向] 改变为 [北向：单位]。这表示当前的坐标的单位包括在文件内。

9.	输入逗号，后面跟一个空格。

10.	点击鼠标右键进入快捷菜单，然后选择域 / 东向。

[东向] 出现在逗号旁。

11.	点击鼠标右键进入快捷菜单，然后选择域 / 高级的 / 改变量 / 单位。

[东向] 改变为 [东向：单位]。这表示当前的坐标的单位包括在文件内。

12.	输入逗号，后面跟一个空格。

13.	点击鼠标右键进入快捷菜单，然后选择域 / 高程。

[高程] 出现在逗号旁。

14.	点击鼠标右键进入快捷菜单，然后选择域 / 高级的 / 改变量 / 单位。

[高程] 改变为 [高程：单位]。这表示当前的坐标的单位包括在文件内。

15.	点击确认，保存导出格式。导出对话框出现。您创建的格式出现在自定义标签的列表中。

16.	要在该格式里导出数据，选择格式并点击确认。另存为对话框出现。

17.	在文件名域中，输入导出文件的名称。

18.	点击保存，创建文件。


使用填充域

 概述及更多信息

用填充域的方法给域输入数值，数值来源于数据库现有的元素。当填充域可用时，填充域指针出现于图形窗口中。本例列举的是：当增加文本元素时用填充域选择坐标。

1.	选择插入 / 文本。插入文本对话框出现。

2.	在文本表达式域中，输入文本。

3.	选择北向域。

4.	把指针放在图形窗口上面，填充域指针出现。

5.	点击图形窗口中您希望文本出现的位置。坐标就填充到北向域和东向域中。

6.	点击确认，把文本加到数据库中。

提示：您能用填充域输入观测时间（点击观测）。


图形建立图纸设置 （绘图 / 打印）

 概述及更多信息

1.	选择文件 / 图纸设置。图纸设置对话框出现。

2.	点击最佳拟合。

3.	点击北原点域或东原点域。填充域指针出现。

4.	在图形窗口中，点击您想作为绘图区域的左上角的位置。

5.	把旋转设置到最佳拟合所选图框中的项目数据。

6.	在图形窗口中，点击并拖拉项目数据上面的绘图框。

7.	改变比例为标准值。例如，绘图的最隹拟合是 1 ：435，则把它变成1 ：500。

8.	点击确认，应用图纸设置。


选择项目的大地水准面模型

 概述及更多信息

要为项目选择大地水准面模型，使用坐标系统向导。即使您想改变当前坐标系统的大地水准面模型，这个方法也适用。

1.	选择文件 / 项目属性。项目属性对话框出现。项目属性对话框出现。

2.	选择坐标系统标签 。

3.	在坐标的系统设置组中，点击改变。选择坐标系统对话框出现。

4.	选择新系统选项，点击下一步。选择坐标系统类型对话框出现。

5．选择适当的坐标系统类型。选择大地水准面模型对话框在坐标系统选择向导的最后出现。选择您需要的大地水准面模型，可以使用的大地水准面模型的列表从坐标系统数据库读出。坐标系统的缺省大地水准面模型被缺省地选出。

6.	点击完成。

您选择的大地水准面模型被应用到了项目中。

注：您能用 Coordinate System Manager程序为坐标系统选择缺省的大地水准面模型。


在项目之间剪切或复制带有属性的点

 概述及更多信息

1.	从源项目选择您想要的点，并复制到目标项目。用选择 / 按点要素命令（在平面视图中可以得到）来选择具有指定要素的点。

2.	为了复制您在新项目中需要的点，选择编辑 / 复制。

3.	在目标项目中，选择编辑 / 粘贴来粘贴点。

4.	如果在两个项目中的属性定义不同，则会出现一个对话框。

5.	点击是，粘贴两个要素和属性库共同的数据。任何未被粘贴的属性数据都记录在粘贴 .rpt 报告中。这个报告存储在您正在粘贴的项目报告文件夹中。

注：只有点能在项目之间被剪切和复制。如果观测值用于确定点的位置，那么得到的坐标就被复制。如果点来自 GPS坐标和观测值，那么 WGS-84 坐标就被复制。这个复制的 WGS-84 坐标能在新项目的 GPS 点校正中使用。


增加属性到点

 概述及更多信息

要增加属性，必须为属性设置项目。

1.	选择您想给选择点 增加属性的点。为此，使用下列操作之一：

  鼠标

  选择菜单

2.	打开属性窗口 。

3.	在属性标签中，点击页面菜单图标 [image] 。快捷菜单出现。

4.	点击插入。具有属性的可以使用的要素代码列表出现。

5.	选择您想增加的具有属性的要素代码。已选要素代码的属性出现。

6.	为每个属性输入数值。Trimble Geomatics Office检查您输入的每个值。这项检查是根据用来设置属性项目的要素和属性库进行的，能够保证数值的有效性。

7.	对任何您想增加到点的并具有属性的其它要素代码重复上述步骤。


查看属性

 概述及更多信息

1.	选择点。为此，采用下列操作之一：

  鼠标

  选择菜单

2.	打开属性窗口 。

3.	选择属性标签。

每次只能查看具有属性的一个要素代码。如果要查看具有属性的不同要素代码，使用下拉列表。

注：只有从项目属性对话框 / 要素标签建立了项目的要素和属性库，属性标签才会出现。


 编辑属性

 概述及更多信息

1.	点击属性。如果属性是菜单，则箭头出现在域的右侧。

2.	点击箭头，显示属性菜单选项的列表。

所有其它属性类型都需要从键盘输入。

注：编辑任何属性信息时，Trimble Geomatics Office都会检查要素和属性库定义，确认有效值被输入。


 插入线段

 概述及更多信息

1.	选择平面视图。进行如下一项操作：

  选择视图 / 平面。

  点击平面视图工具。

 按 Alt+2。

2.	进行如下一项操作:

  选择插入 / 线。

  选择插入线工具。

具有已选线标签的插入线网对话框出现。

3.	在从点域中，进行如下一项操作:

  用填充域选择您需要定义线的第一个点。

  给您需要定义线的第一个点输入点名称。

4.	在到点域中，进行如下一项操作：

  用填充域选择您需要定义线的第二个点。

  给您需要定义线的第二个点输入点名称。

5.	在图层域中，进行如下一项操作：

  选择您想增加线的图层。

  输入新的图层名称来创建新图层。

6.	在线形式域中，选择您需要显示线的线形式。

7.	要增加线，进行如下一项操作：

  点击插入。

  按输入。

您在到点域中选的点出现于从点域中。您能够继续增加线，而不必重新输入“从”点。

线出现于图形窗口里（如果您为线选择的图层打开了其可见属性）。

8.	点击关闭，停止插入线。


 插入曲线

 概述及更多信息

1.	选择平面视图。 进行如下一项操作：

  选择视图 / 平面。

  点击平面视图工具。

  按Alt+2。

2.	选择插入 / 曲线。具有已选曲线标签的插入线网对话框出现。

3.	在从点域中， 进行如下一项操作：

  使用填充域并点击适当的点。

  用键盘输入新的点名称。

4.	在到点域中，进行如下一项操作：

  使用填充域并点击适当的点。

  用键盘输入新的点名称。

5.	在进入正切域和退出正切域中，根据用来定义曲线的点，把值保留为 < 自动 > 来自动输入正切值。您可以输入自己的正切值。

6.	在弧宽度域中，输入0和1之间的数值。弧宽度定义曲线中弧的宽度。弧宽度数值越高，曲线的宽度越大。

7.	在图层域中，进行如下一项操作：

  选择您想增加曲线的图层。

  输入新的图层名称来创建新图层。

8.	在线形式域中，选择需要显示曲线的线形式。

9.	要增加曲线，进行如下一项操作：

  点击插入。

  按输入。

曲线出现于图形窗口（如果您为曲线选择的图层打开了其可见属性）。每次从另一个曲线中的点增加曲线时，Trimble Geomatics Office就将重新计算现有曲线，以保证显示的曲线平滑。

10.	点击关闭，停止插入曲线。


插入弧段

 概述及更多信息

1.	选择平面视图。 进行如下一项操作：

  选择视图 / 平面。

  点击平面视图工具。

  选择 Alt+2。

2.	选择插入 / 弧段。具有已选弧段标签的插入线网对话框出现。

3.	在从点域中， 进行如下一项操作：

  使用填充域并点击适当的点。

  用键盘输入点名称。

4.	在到点域中， 进行如下一项操作：

  使用填充域并点击适当的点。

  用键盘输入新的点名称。

5.	在中心点域中，用一个现有的点作为弧段的中心，进行如下一项操作：

  输入一个现有的点名称。

  用填充域选择一个现有的点。

点的坐标被复制到中心北向域和中心东向域。

6.	在中心北向域和中心东向域里，点击图形窗口中使坐标用作弧段中心的位置。坐标就复制到这些域。

如果您把中心点和中心坐标都输入，这个中心点就被使用。

7.	在劣弧域中，如果您想创建一个大弧，选择假选项。否则，选择真选项。在两点之间总有两个可能的弧，它们共同定义一个圆。这个设置定义您想画什么弧。

8.	在图层域中，进行如下一项操作：

  选择您想增加弧段的图层。

  输入新的图层名称来创建新图层。

9.	在线形式域中，选择您需要显示弧段的线形式。

10.	要增加弧段（原文为“曲线”），进行如下一项操作：

  点击插入。

  按输入。

弧段出现于图形窗口中（如果您为弧段选择的图层打开了其可见属性）。

11.	点击关闭，停止插入弧段。


插入文本

 概述及更多信息

1.	选择平面视图。 进行如下一项操作：

  选择视图 / 平面。

  点击平面视图工具。

  按 Alt+2。

2.	进行如下一项操作：

  选择插入 / 文本。

  点击插入文本工具。

插入文本对话框出现。

3.	在文本表达域中，输入您希望显示的文本。如果要用域码（例如：项目主题），点击鼠标右键看快捷菜单，选择域。

4.	在北向域中，给文本位置输入北向值。或者点击图形窗口中位置，使用填充域。

5.	在东向域中，给文本位置输入东向值。或者点击图形窗口中位置，使用填充域。

6.	在起点域中，给文本元素输入起点值。如果您不指定起点，文本将穿越窗口水平地显示。

7.	在放置类型域中，指定文本对于北向和东向数值所放的位置，并从列表中挑选数值。

8.	在图层域中，选择您想从列表增加文本的图层。为了在新图层中输入文本，键入新名称。

9.	在文本形式域中，从列表中选择文本元素的文本形式。如果您需要为正在增加文本的图层设置缺省文本形式，选择<按图层>选项。

10.	点击插入，增加文本到数据库，并且保持对话框打开以便增加更多的文本。

11.	点击关闭，停止插入文本。


创建新的项目模板

 概述及更多信息

1.	进行如下一项操作：

  点击新建工具。

  选择文件 / 新项目。

新项目对话框出现。

2.	在新建组中，选择模板选项。细节组里的项目目录变成缺省模板目录。

3.	在名称域中，输入项目模板的名称。

4.	在模板域中的，从列表中选择模板并点击确认。项目属性对话框出现。

5.	选择您想让使用该模板的任何项目都有的缺省项目属性，点击确认。

一条信息出现。如果继续在该模板中工作，点击是。如果要关闭项目模板，点击不。

6.	如果选择是，那么您能继续在该项目模板中工作。如果要完成在该项目模板中的工作，选择文件 / 关闭。

7. 	创建新项目时，可以在新项目对话框的模板列表中看到新模板。


创建点形式

 概述及更多信息

1.	在平面视图中，选择编辑 / 形式。CAD 形式对话框出现。

2.	在点形式标签中，点击新建。创建点形式对话框出现。

3.	完成创建点形式对话框。

点击确认。

点形式被加到数据库。它出现于CAD形式对话框 - 点形式标签中。


打开属性窗口

 概述及更多信息

进行如下一项操作：

  选择编辑 / 属性。

  点击编辑属性工具 [image] 。

  从快捷菜单选择属性。

  双击图形元素。

  按 Alt + Enter。


导出数据词典文件 (.ddf) 到 Trimble Survey Controller

 概述及更多信息

注：只能传输 .ddf 文件到运行Trimble Geomatics Office版本7.00或更高版本的设备中。

1.	选择文件 / 导出。导出对话框出现。

2.	在测量标签中，选择数据词典文件到测量控制器（*.ddf）选项，点击确认。选择对话框出现。

3.	选择您想传输到Trimble Survey Controller的文件，点击打开。保存对话框出现。

4.	选择测量控制器设备，点击打开。正在连接对话框出现。

当实现了与设备的连接后，主内存 (C:) 在框中出现。如果PC卡当前插入在设备中，则PC卡（A :）也会出现。

注：如果Trimble设备没有PC卡，这个对话框不可用。

进行如下一项操作：

  选择主内存 (C:) 选项，把文件存储到Trimble Survey Controller的主内存里。

  如果有插入的PC卡，并希望在该PC卡上存储文件，则选择 PC卡 (A:) 选项。

6.	点击打开。主内存或PC卡被阅读。现有的数据词典文件出现。

7.	在文件名域中，选择导出的内部 .ddf 文件名出现。这是您将在Trimble Survey Controller中看的名称。

8.	必要时，编辑该名称。

9.	点击保存。正在加载对话框出现，行进条显示传输的行进过程。

传输完成后，正在加载对话框消失，并返回到图形窗口。现在您能够在Trimble Survey Controller中使用 .ddf 文件。

注：如果正在与 Trimble Survey Controller 版本 7.60 来回传输数据，则采用版本 7.50 .dc 文件格式。


拖放 .dc 文件到项目中
拖放文件到项目中

 概述及更多信息

要拖放文件到项目中：

1.	打开要传输文件的目的 Trimble Geomatics Office 项目。

2.	打开 Microsoft Windows Explorer。详细资料请参考Microsoft Windows操作系统文件。

3.	确定包含要导入文件的文件夹位置。

4.	用鼠标右键点击要导入的文件。

5.	拖放文件到 Trimble Geomatics Office 的图形窗口上。

6.	释放右键来看快捷菜单。

7.	选择适当的文件（*.dc）选项。

8.	点击左键，文件被导入。

有关导入期间可能发生动作的资料，请看导入概述。项目的文件存储在数据文件 \ Trimble 文件的文件夹中。


按名称选择点

1.	选择选择 / 点。选择点对话框出现。

2.	选择一般标签 。

3.	在名称匹配域中，输入您想选择的点的名称。也可以用范围和通配符字符选择多重点。

4.	点击确认。与所选名称相匹配的点被选出来。状态栏显示了选择的点数。

注：使用选择点对话框之前，任何当前已选的元素都不保留在选择集中，除非选择了添加到当前的选择检查框。


按点质量选择点

1.	选择选择 / 点。选择点对话框出现。

2.	选择一般标签 。

3.	在具有点质量域中，选择您想选的组件和质量的组合。您能从列表中选择多个元素。

4.	点击确认。

与选择相匹配的点被选出来。状态栏显示了选择的点数。

注：使用选择点对话框之前，任何当前已选的元素都不保留在选择集中，除非选择了添加到当前的选择检查框。


从已选的点选择观测值

1.	在测量视图中，选择选择 / 观测值。选择观测值对话框出现。

2.	在从点域中，输入点名称，或输入在选择中使用的多重点范围。您也可以用填充域和通配符。

3.	点击确认。

与选择相匹配的点的观测值被选出来。状态栏显示了选择的观测值的数目。

注：使用选择点对话框之前，任何当前已选的元素都不保留在选择集中，除非选择了添加到当前的选择检查框。


禁止观测值

1.	在测量视图中，选择一个观测值。

进行如下一项操作：

  打开属性窗口。点击总结图标 [image] ，并从状态域中选择禁止选项。

  选择编辑 / 使能 / 禁止观测值。

注：禁止观测值需要用重新计算更新测量信息。移动一个点时，任何对它的观测值都会自动禁用。


从 Trimble Survey Controller导入工作到 Trimble Geomatics Office

1.	进行如下一项操作：

  选择文件 / 导入。

  点击导入工具。

2.	在测量标签中，选择测量设备选项。数据传输打开对话框出现。

3.	选择Trimble Survey Controller 设备。

4.	点击打开。正在连接对话框出现。当完成连接后，打开对话框更新显示已选的设备。

5.	从下列选项中选择一项您想传输的文件：

  主内存 (C:) 选项，当文件存储在 Trimble Survey Controller 主内存时。

  PC卡 (A:) 选项，当文件存储在测量控制器里所插的PC卡内时。

注：如果 Trimble 设备没有 PC 卡，该对话框不可用。

6．点击打开。正在接收对话框出现，并且行进条显示传输的行进过程。传输完成后，正在接收对话框消失，与设备的连接断开。


隐藏（或显示）工具栏

1.	进行如下一项操作：

  用鼠标右键点击工具栏区域。出现一个快捷菜单。

  选择视图 / 工具栏。出现一个菜单。

可用的工具栏列表出现。当前可见的每个工具栏名称旁有个校验标记。

2.	选择需要的工具栏。这个工具栏从Trimble Geomatics Office图形窗口消失（或者重新出现）。

3.	要再次查看该工具栏，重复上述步骤。


传输天线细节到 Trimble Survey Controller

1.	选择文件 / 导出。导出对话框出现。

2.	在测量标签中，选择天线细节到测量控制器选项。数据传输另存为对话框出现。

3.	选择Trimble Survey Controller 设备并点击打开。正在连接对话框出现。当完成连接后，保存对话框出现。

进行如下一项操作：

  选择主内存(C:)选项，把文件存储到Trimble Survey Controller的主内存中。

  如果有插入的PC卡，并希望在该PC卡上存储文件，则选择 PC卡 (A:) 选项。

注：如果设备没有 PC 卡，该对话框不可用。

5.	点击打开。选择的目录被阅读。目录里的全部测量控制器文件都显示出来。Trimble Geomatics Office项目名称出现在文件名域中。这是将要导出到Trimble Survey Controller的Trimble Survey Controller工作名。可以在必要情况下编辑这个名称。

6.	点击保存。正在加载对话框出现，行进条显示传输的行进过程。传输完成后，正在加载对话框消失，与数据控制器的连接断开。

天线.ini 文件 (位于 \ 程序文件 \ 公共文件 \ Trimble \ 配置文件夹内) 传输到 Trimble Survey Controller中。

传输完成后，正在加载对话框消失，与设备的连接断开。


导出属性注释

1.	选择文件 / 导出。导出对话框出现。

2.	在 CAD / ASCII 标签中，选择 DC 文件属性注释 (测量控制器 V4) 选项并点击确认。另存为对话框出现。

3.	输入文件名。

4.	点击保存。


显示关于 Trimble Geomatics Office的信息

1.	从帮助菜单选择关于 Trimble Geomatics Office 的命令。 关于Trimble Geomatics Office 对话框出现。

2.	点击确认。


反转观测值方向

1.	从测量视图，选择您想应用的反向观测。

2.	选择编辑 /反向观测值溢出流。

3.	观测值的方向被反转。当观测值被相反方向应用时，计算出来的坐标和质量可能会改变。

注意：如果您想让观测值溢出的点没有已知位置（例如 RTK 观测点），那么这个观测值不被应用。

注：用全站仪采集的地面观测值不能反向。


查看错误和警告

1.	进行如下一项操作：

  从测量视图双击带有警告指示或标志的点或观测值。

  在状态栏上双击标志图标，选择带有警告指示标志的所有点和观测值。

具有已选元素的属性窗口出现。

2.	从属性窗口中，选择您想查看的点或观测值（如果在您的选择中有一个以上的元素）。

3.	要查看警告页，点击警告菜单钮 [image] 。

发生的错误类型信息将显示出来。

4.	要查看点的附加细节，选择测点推算报告工具 [image] 。

测点推算报告出现。


传输 UK 国家格网 (*.pgf) 文件到 Trimble Survey Controller
传输 UK 国家网格 (*.pgf) 文件到 Trimble Survey Controller

注：您只能传输 .pgf 文件到Trimble Survey Controller版本7.5或更高版本：

1.	开启数据传输功能。进行如下一项操作：

  当没有项目打开时，选择功能 / 数据传输。

  随时选择开始 / 程序 / Trimble / Trimble功能 / 数据传输。

数据传输对话框出现。

2.	选择发送标签。

3.	从设备列表中选择您想导出文件的测量控制器设备。数据传输程序将尝试连接到所选设备上。连接成功后，右上端图标中的电缆将会改变，以显示设备被连接起来。并且，右上端图标下面的状态线显示‘已连接到 <设备>’。这里的<设备>表示设备的类型（比如：测量控制器）。

4.	点击增加。打开对话框出现。列表里的看显示了您为该设备选择文件的最后文件夹，主列表显示了那个文件夹中的文件夹和文件。

5.	从类型文件列表中，选择 UK 国家网格文件 (*.PGF) 选项。

6.	用列表和表格框中的看改变所选的驱动器和文件夹，并选择您想传输的文件。

要传输由 Trimble Geomatics Office提供的现有 .pgf 文件，从程序文件 \ 公共文件\ Trimble \ Geodata 文件夹中选择 North.pgf 或 East.pgf 文件。

7.	可以发送文件到主内存或者PC卡（如果安装了PC卡的话）。从目标列表中选择目标。

8.	要保证文件格式域被设置到工作文件 v7.50。如果必要，从列表中选择这个选项。

9.	点击选择。打开对话框关闭，并返回到数据传输对话框。选择的文件出现在文件发送列表中。

10.	点击传输。在文件从设备的文件格式转换期间，正在转换对话框出现。当所有文件都被转换后，正在发送对话框出现，它显示了已选文件的导出过程。

传输完成后，传输已完成对话框出现，它显示了传输结果。

注：如果您正在与 Trimble Survey Controller 版本7.60来回传输数据，则使用版本7.50 dc文件格式。


用已存的校正坐标和已平差的坐标（从网平差模块得到）进行校正

1.	在网平差中的每个点上完成了最小的受约束平差并建立了 WGS-84 坐标之后，保存这些坐标，以便用于站点校正的已观测 GPS 坐标。校正坐标由 WGS-84 纬度、经度和椭球高度构成。

要保存校正坐标：

  选择平差 / 校正坐标 / 保存。

保存校正坐标对话框出现。

注：只有当 WGS-84 被选择为您的平差基准、并且只有 GPS 观测值包含在以前的平差中时，这条命令才可以用。

注：如果在平差期间创建了平差转换参数，那么当执行 GPS 点校正时，这些参数将被丢弃。Trimble Geomatics Office只允许二者之中择其一。

2.	选择以下操作之一：

  在现有点下创建坐标选项

  在具有后缀的新建点下创建坐标选项

3.	点击确认。校正坐标被保存。

注：WGS-84坐标在平差中为每个点而创建。您能够在属性窗口中查看该坐标，但这个坐标不能被编辑。

4.	在项目基准中执行受约束平差（关于如何进行这种平差的方法，请参考适当的网平差帮助主题）。平差后的数值保存在数据库中。

注：一个已平差的网格坐标在平差中为每个不受约束的点创建。这个坐标能够在属性窗口中查看。

5.	用网平差得到的点对执行 GPS 点校正。为此，选择测量 / GPS点校正，GPS 点校正对话框出现。

6.	在校正组件组中，选择您想计算的校正参数。

7.	点击点列表。点列表对话框出现。

8.	用点列表对话框来为校正选择点对（GPS 点和网格点）。进行以下操作之一：

  使用填充域，或者在 GPS 点域中输入已存的校正坐标名称。

  使用填充域，或者在网格点域中输入与已平差坐标匹配的名称。

如果最小的受约束平差保存在相同点下，则网格点域将被自动填充。当输入 GPS 点时，显示的值来自于已存的校正坐标。当输入网格点时，已平差值就被选择。

9.	重复上面步骤，选择校正中需要的所有点对。

10.	当选择了所有点对后，点击关闭，返回到 GPS点校正对话框。

11.	点击计算，计算校正参数。校正结果出现于校正总结组中。

12.	点击确认，把校正应用到项目中。坐标系统就被校正参数更新。现在您可以把校正传输到Trimble Survey Controller中。


报告和导出事件

您可以定义报告或导出格式，以便记录由接收机记录下来的一个事件的时间。

要对事件作出报告，创建自定义的数据库报告：

1.	选择在Trimble Geomatics Office中带有事件记录的点。具体步骤：

a.	选择选择 / 点。选择点对话框出现。

b.	选择 GPS 标签。

c.	从域方法列表中选择事件。

d.	点击确认。

所有带有事件记录的点被选择出来。

2.	选择报告 / 附加报告。附加报告对话框出现。

3.	进行如下一项操作：

  点击编辑，修改现有报告格式。

  点击新建，创建新的报告格式。

定义报告格式对话框出现。

4.	在格式体域中，用鼠标右键点击进入快捷菜单，然后选择高级的 / 子记录 / 点obs / 时间。

为自定义导出定义导出事件：

1.	选择文件 / 导出。导出对话框出现。

2.	在自定义标签中，进行如下一项操作：

  点击编辑格式，修改现有的格式。

  点击新建格式，创建新的报告格式。

定义ASCII导出格式对话框出现。

在格式体域中，用鼠标右键点击进入快捷菜单，然后选择高级的 / 子记录 / 点obs / 时间。


时间格式版面

典型的显示事件的时间格式是：09:12:55 8 二月 2000

如果要改变这个版面，用鼠标右键在域码旁边点击，进入快捷菜单，选择高级的 / 更多的 / 格式版面。然后选择一个样板时间格式版面或自己创建时间格式版面。要得到更多信息，请参考时间格式版面。

注：如果要显示最接近的毫秒级事件时间，在域码中增加下列时间格式版面：<H:mm:ss.nnn>。其中的nnn是十进制的秒数。例如，[点 Obs. 时间：<H:mm:ss.nnn>]。如果要增加时间精度，则增加十进制秒数。例如，nnnn 输出前4个十进制秒数。


在项目间复制观测值数据

为了复制Trimble Geomatics Office项目之间的观测值数据，使用Trimble Data Exchange Format。不能使用复制和粘贴功能。

如果要在项目之间复制观测值数据：

1.	在当前Trimble Geomatics Office项目中，选择您想复制的观测值数据。

2.	用Trimble Data Exchange Format从当前项目导出数据：

a.	选择文件 / 导出。导出对话框出现。

b.	在测量标签中，选择 Trimble Data Exchange Format并点击确认。另存为对话框出现。

c.	保存文件。

3.	在Trimble Geomatics Office中创建一个新建项目。

4.	用 Trimble Data Exchange Format导入观测数据到新项目中：

a.	选择文件 / 导入。导入对话框出现。

b.	在测量标签中，选择 Trimble Data Exchange Format并点击确认。打开对话框出现。

c.	选择文件。

观测数据导入到 Trimble Geomatics Office项目中。

注：如果您想创建项目中的所有观测复件并将其打印出来，那么创建一个复制 Trimble Geomatics Office项目。


人工导入地面数据

如果人工导入地面数据到 Trimble Geomatics Office中，使用 Softdesk Fieldbook 格式。这个格式是由 Autodesk 开发的。

用地面数据在Softdesk Fieldbook格式中创建文件：

  把文件导入到 Trimble Geomatics Office中：

a.	选择文件 / 导入。导入对话框出现。

b.	在测量标签中选择第三方数据记录文件。打开对话框出现。

c.	选择您想导入的文件。

d.	从类型文件域选择 Autodesk FBK fieldbook 格式文件（*.FBK），点击确认。

文件导入到 Trimble Geomatics Office 项目中。

注：Autodesk Softdesk Fieldbook 格式描述如下。该格式已从 AutoCAD Land Development Desktop 的帮助文件中获取。

考虑下列因素：

  格式里任何一条不以确认命令开始的线都被忽略。

  包括在括号 () 中的列表是可选的。

  Trimble Geomatics Office需要您用点数。

  点描述必须包含在双引号（"）内，这是 Fieldbook 格式文件定义的一个部分。这意味着在点描述中可以使用空格。


点创建命令

AD (point) [angle] [distance] (descript)

AD [VA] (point) [angle] [distance] [vert angle] (descript)

AD [VD] (point) [angle] [distance] [vert distance] (descript)

BD (point) [bearing] [quadrant] [distance] (descript)

BD [VA] (point) [bearing] [quadrant] [distance] [vert angle] (descript)

BD [VA] (point) [bearing] [quadrant] [distance] [vert dist] (descript)

DD (point) [angle] [distance] [vert angle] (descript)

DD [VA] (point) [angle] [distance] [vert angle] (descript)

DD [VD] (point) [angle] [distance] [vert distance] (descript)

F1/F2 (point) [angle] [distance] (descript)

F1/F2 [VA] (point) [angle] [distance] [vert angle] (descript)

F1/F2 [VD] (point) [angle] [distance] [vert distance] (descript)

NE (point) [North] [East] (descript)

NEZ (point) [North] [East] (elev) (descript)

NE SS (point) [North] [East] (elev) (descript)

PRISM [height]

PT OFFSET (point) [offset] (ahead)

STADIA (point) [angle] [distance] [rod] (vert angle) (descript)

ZD (point) [azimuth] [distance] (descript)

ZD [VA] (point) [azimuth] [distance] [vert angle] (descript)

ZD [VD] (point) [azimuth] [distance] [vert distance] (descript)


点定位命令

AZ [point 1] [point 2] [azimuth]

BS [point] (orientation)

STN [point] (inst. height) (descript)

设备改正命令

ANGLES [RIGHT, LEFT] [ZENITH, NADIR, HORIZ]

ATMOS [ON, OFF]

CR [ON, OFF]

EDM OFFSET  [offset]

HORIZ ANGLE [RIGHT, LEFT]

PRESS [pressure] [INCH, MBAR, MM]

SF [factor]

PRISM CONSTANT  [constant]

PRISM OFFSET  [offset]

TEMP [temperature] [F, C, K]

UNITS [METER, FOOT] [DMS, DECDEG, GRAD, MILS, RADIANS]

VERT ANGLE [ZENITH, NADIR, HORIZ]


在属性窗口中增加坐标

Trimble Geomatics Office允许您在属性窗口里为一个点增加坐标。方法是使用总结页面中的增加坐标工具 [image] 。

具体方法是：

1.	双击项目中的点。属性窗口出现。

2.	在总结页面中，选择 [image] ，然后选择需要增加的坐标类型，即：网格、地方、或者WGS 84。

在属性窗口的树形结构中，新的坐标在选择点的下面出现。一个前缀加到名称前，表明这个坐标是网格(G)、地方(L)、或WGS-84（W）坐标。新坐标的总结页面把所有域都显示为零。

注：对于每个点，只能输入一个 WGS-84坐标和一个网格或地方坐标。增加 WGS-84坐标时，这个选项在增加坐标列表中变为不可用。如果点已经有了 WGS-84 坐标以及网格或地方坐标，增加坐标钮也变为不可用。

3.	要组合坐标的北向、东向、高程和高度域，点击每个域，然后再点击插入当前数值按钮 [image] 。每个域都填充了当前的点位置和质量。必要时，您可以编辑这个信息。

提示：如果确实想用这个坐标而不是观测值，就只增加坐标。用键入的坐标重新计算优先于用相同质量的观测值。这可以保证设计点的使用优先于放样观测值。

注：点的附加坐标能由Trimble Geomatics Office产生并存储。这些坐标包括：

  产生于平差的坐标

 为校正保存的WGS-84坐标


在属性窗口中编辑坐标

 概述及更多信息

Trimble Geomatics Office允许您在属性窗口里为点编辑坐标。

具体方法是：

1.	双击项目中的点。属性窗口出现。

2.	在属性窗口的树形结构中，为新点扩展树形结构并选择您想编辑的键入坐标 （WGS-84 或网格/地方）。

3.	编辑坐标组件和坐标质量。

注：对于要编辑的坐标域，坐标视图设置和坐标类型设置必须相同。

4.	编辑了坐标后，选择测量 / 重新计算来执行重新计算。

有关在属性窗口中增加和编辑坐标的详情，请参考属性窗口坐标主题。


导入数字水准文件

当导入数字水准 (*.dat, *.raw) 文件或用DiNi数字水准（采用测量设备）下载文件时，数字水准导入对话框出现。 具体方法是：

1.	选择文件/导入。导入对话框出现。

2.	在测量标签中，选择数字水准文件 (*.dat, *.raw) 并点击确认。打开对话框出现。

3.	选择数字水准文件。数字水准导入对话框出现。

4.	在数字水准导入对话框中，通过在测点列中选择检查框来定义测点。

高程变化量在测点之间被计算出来。当导入测点时，它们将与其它具有相同名称的点合并。要确认点的名称是唯一的。您能在数字水准导入对话框里编辑点名称。

注：没有定义为测点的点将不被导入。

5.	在数字水准导入对话框中，为起始点输入一个高程。这个高程用于计算其它点的高程。要编辑起始点高程，点击闭合环中的任何点。这个环的起始点高程显示在高程组中。在高程组中编辑高程和质量并点击输入。高程就将为所有测点计算出来。用这些计算出的高程来检查已知数值并确认数据。

注：只有带高程符号的高程是被导入的高程。所有其它测点都将有导入的高程变化量。它们的高程将在重新计算期间被计算出来。

提示：在数字水准导入对话框中所作的任何改变都仅仅影响导入的数据，这些变化不影响数字水准(*.dat, *.raw) 文件。

6.	点击确认。数字水准文件被导入。

注：被导入的观测值可能没有水平坐标，所以可能不会出现在图形窗口里。为了在属性窗口中查看水准数据，用选择工具之一选择水准观测值，然后打开属性窗口。为此，进行如下一项操作：

  选择编辑 / 属性。

  在工具栏里选择属性窗口工具 [image] 。

提示：采集数字水准数据时，Trimble 建议把您想导入到 Trimble Geomatics Office的、带有唯一前缀或后缀的点存储起来。例如，存储所有您想用作测点的、并具有前缀- STN 的点。这会使得在数字水准导入对话框中采用按筛选选择钮的方法去选择点变得更简单。


在 Trimble Geomatics Office 软件中查看背景图
在 Trimble Geomatics Office中查看背景图

 也请参见

在 Trimble Geomatics Office中查看背景图：

1.	选择查看 / 选项。查看选项对话框出现。

2.	在背景图标签里，点击增加。增加对话框出现。

3.	选择背景图文件，点击确认。

注：Trimble Geomatics Office能在图形窗口中显示背景文件。您能导入 Drawing Exchange Format (.dxf)、Windows Bitmap (.bmp) 或者 Tagged Image File Format (.tif)文件加以显示。为正确显示，Windows Bitmap (.bmp) 和 Tagged Image File Format (.tif) 文件必须是地理参考的。ESRI's World 文件格式是用于地理参考的背景文件。这些文件必须是在对应背景文件相同的文件夹里。

背景图文件出现在 Trimble Geomatics Office中。

有关在Trimble Geomatics Office中使用背景图的详情，请参考视图选项-背景图 。


在 Trimble Geomatics Office 中查看格网线
在 Trimble Geomatics Office中查看网格线

1.	选择视图 / 选项。视图选项对话框出现。

2.	在网格线标签中，选择显示网格线检查框。这个组里的选项就变为可用。

3.	选择网格线的固定数字或网格间隔选项，在每个域中输入适当的数值。

4.	选择网格线类型和颜色。

5.	如果您想标记网格线，选择标记网格线检查框。

6.	点击确认。


!选择独立的基线
选择独立的基线

独立的基线集是由在给定的GPS域层面中需要连接所有点时段的最小基线数目构成。对于任何给定的n个同步 GPS 点时段，有 n � 1 个独立的基线。例如，在具有五个接收器的域层面中，有10条可能的基线，但只有四条独立的基线。在下面图表中，独立的基线用点划线表示。

独立基线集的概念基本上应用于使用静态和快速静态技术实施的测量，尤其重要的是对包括网平差在内的项目的测量。

使用独立的基线集能确保网平差不被多余的人为因素（扩大的自由度）所影响，这种人为因素会导致对已平差坐标误差的低估。

由两个以上接收器得到的GPS 域层面的基线能够形成多重独立的基线集。包括在独立集内的基线选择可以基于基线解算的质量、或者基于实现一个所期望的网几何结构。

要指定一个独立基线集，可以采用下列方法之一：

  对于GPS域层面，从所有潜在基线中只选择和处理一个独立的基线集。

  处理GPS域层面的所有潜在基线，并在结果保存到项目时刻选择一个独立的集。

  处理GPS域层面的所有潜在基线，并把所有结果都保存到项目中。然后，从网平差的考虑角度删除从属基线。

方法是采用从属基线查看工具 [image] 。该工具使您能够链接图形窗口和时间线观测值。选择它时，软件只显示当前时间线视图中的后处理基线和同时被观测的后处理基线。测量视图中的所有其它后处理基线都被隐藏起来。

使用从属基线视图工具可以显示同时被观测的基线，并避免采用来自平差中的从属基线。

进行以下操作之一：

  在属性窗口中，改变从属基线的状态到禁用。

  在属性窗口中，改变从属基线的状态到激活。

  在属性窗口中，清除从属基线的使用在网平差中检查框。

  用观测值对话框清除从属基线的使用检查框。

执行这些操作的最好方法是用多重编辑对话框。例如，改变从属基线状态到禁用：

1.	选择从属基线查看工具。

2.	在图形窗口中选择从属基线。

3.	选择编辑 / 多重编辑。多重编辑对话框出现。

4.	选择设置观测状态到检查框。

5.	从列表中选择禁用，点击确认。

现在，已选择的观测值将处于禁用状态。


导入Trimble 3600/5600 GDM文件

注：在任务和面文件中包含测量数据时，首先导入面文件。

1.	选择文件/导入。导入对话框出现。

2.	在测量标签中，选择Trimble 3600/5600 GDM文件 (*.job, *.are)，然后点击选项。设置对话框出现。

3.	指定Trimble 3600/5600 GDM控制单元设置和重复点设置。

4.	点击确认，接受改变并返回到导入对话框。

5.	点击确认，打开对话框出现。

6.	选择要导入的文件，然后点击打开。

注：Trimble Geomatics Office假定全部3600/5600 GDM文件都被定义为只比例因子坐标系统。更多信息，请看只比例因子。

也请参见。


导出Trimble 3600/5600 GDM面(*.are)文件
导出到Trimble 3600/5600 GDM面 (*.are) 文件

1.	选择文件/导出。导出对话框出现。

2.	在测量标签中，选择Trimble 3600/5600 GDM文件（*.are），然后点击选项。设置对话框出现。

3.	指定Trimble 3600/5600 GDM控制单元设置。

4.	点击确认，接受改变并返回到导出对话框。

5.	点击确认，另存为对话框出现。

6.	指定文件名和位置，点击保存。（缺省地，项目名决定文件名。）

注：导出到面文件中的坐标使用在Trimble Geomatics Office项目中定义的坐标系统。

也请参见


导出Pcode (*.pco)文件到Trimble 3600/5600 GDM仪器
导出Pcode（*.pco）文件到Trimble 3600/5600仪器

1.	选择文件/导出。导出对话框出现。

2.	在测量标签中，选择到Trimble 3600/5600 GDM（*.pco）的Pcode文件，然后点击确认。选择对话框出现。

3.	选择Pcode文件，点击打开。数据传输另存为对话框出现。

4.	选择Trimble 3600/5600 GDM设备，点击打开。正在连接对话框出现。连接妥当后，保存对话框出现。

5.	点击保存。对话框显示文件传输的进程。当传输完成时，对设备的连接中断。

也请参见


导入 - 概述

更多信息

帮助 ...	对话框	也请参见
概述

可用不同的文件格式将数据导入到Trimble Geomatics Office项目中。例如，可导入包含控制点的文件、原始 GPS (*.dat)文件、测量控制器 (*.dc)文件 和自定义的格式。

对于所支持的导入格式的介绍，参见主题导入对话框。

可从下列项导入数据：

  运行Trimble Survey Controller设备

  Trimble GPS接收机

  计算机中的文件

  全站仪

  数字水准

导入文件后，文件中的点被添加到数据库。如果导入了与数据库中已有点同名的点，合并点的方法取决于重复点选项对话框(链接到该主题)的选项设置。

导入文件时出现的情况取决于文件类型。但是，对于所有文件类型，会自动进行重新计算 ，产生一个导入报告(named <imported file name>.html) ，并将其保存在项目的报告文件夹中。

从文件导入的所有实体都保存在选项组中。对于 .dc文件，根据文件内部任务名称来命名选项组。对于其它文件类型，选项组的名称就是导入文件的名称。要管理选项组，使用选择/ 选项组命令。

提示： 要浏览选项组中的任何数据，使用浏览筛选器对话框(链接到主题)中的只显示选项组中数据项。

提示： 要改变导入操作，使用撤销命令。 如果导入后已经关闭了项目，使用选择点对话框/一般标签中的来源选项，并删除所选项来撤销导入操作。

注： 如果将一个文件几次导入到同一个项目，文件将被添加到相应的文件夹，在文件名之后有一个短横线和一个数字。例如，如果将Trimble原始GPS数据(.dat)文件MyGPSFile导入了两次，则创建一个名为MyGPSFile的文件夹(在第一次导入文件时)。 文件中将出现 MyGPSFile.dat和MyGPSFile-1.dat。导入时识别重复的数据，不将它们添加到数据库中。


导入对话框

使用此对话框将数据导入到项目中。

要访问它，有以下几种方法：

  选择文件/导入。

  点标准工具栏上的导入按钮 [image] 。

导入格式由三个标签表示：

  测量

  CAD / ASCII

  自定义

新建格式

选择自定义标签时，此按钮有效。

要创建新的自定义格式，点击新建格式。

出现定义ASCII 导入格式对话框。

使用此对话框定义导入格式。

编辑格式

选择自定义标签时，此按钮有效。

点击编辑格式，修改已有的ASCII导入格式。

出现定义ASCII导入格式对话框。

使用此对话框编辑导入格式。

删除格式

选择自定义标签时，此按钮有效。

点击删除删除自定义的导入格式。系统会提示确认该操作。

要确认删除，点击是。

自定义

使用自定义钮在导入对话框中选择导入选项列表。从检查表选择需要的导入选项。

您可以从自定义对话框添加外部筛选器。外部筛选器是一些分离的程序，可以与Trimble Geomatics Office集成在一起。任何用于Trimble Geomatics Office中的外部筛选器，如果要添加到该系统，必须依从特定的要求。只有导入对话框里当前安装的已选标签筛选器才会出现。

任何筛选程序必须被编译为具有特殊导出功能的Dynamically Linked Library (*.dll) 文件，并且必须被创建为COM（组件对象模块）对象。

如果选择了适当的文件，Trimble Geomatics Office将把筛选器COM对象登记在计算机里，并且按照系统需求改变.dll接口。如果没有成功，系统将报告不能登记此筛选器。如果筛选器被成功安装，则对话框将列出筛选器的简短描述。

更多信息，请看外部导入/导出筛选。

选项

对于导入文件，点击选项按钮：

  指定在导入时管理重复点的方法。

  设置导入数据质量。

  指定已导入数据单位。

  在已导入文件中指定设置。

  改变导入数据选项到设备3300/3600/5600 Elta M5或3600/5600 GDM。

如果选择了一个不同于项目中所用的坐标系统，Trimble Geomatics Office将读取文件、转换坐标到项目坐标系统、存储点并在项目坐标系统中显示它们。数据文件保持相同。

注： Trimble Geomatics Office中显示的、从数据文件中导入的点坐标值可与文件中已有的坐标值不同。


导入格式 - 测量标签

  概述和更多信息

使用测量标从Trimble Survey Controller、Trimble GPS接收机、Trimble 3600/5600 GDM 仪器、全站仪、数字水准或计算机中的测量数据文件来导入数据。

要访问导入/测量标签：

1.	选择文件/导入。

2.	选择测量标签。

可将自定义格式移动到此标签。更多信息，参见Asciiimp.dat文件。

注： 也可用拖放导入文件。

使用测量标签导入以下格式：

格式	用此格式导入 �
数字水准文件 (*.dat, *.raw)	数字水准文件
GPS 数据文件 (*.dat)	来自计算机的Trimble GPS.dat 文件。
网格化DTM 文件(*.dtx) )	网格化的用DTMLink程序创建的数字地面模型。
NGS 数据表单文件 (*.dat, *.dsx, *.htm, *.html)	国家大地测量(NGS) 标准格式的数据文件。
Trimble 数据交换格式	Trimble 数据交换格式中的带数据的 ASCII 文件。 此格式主要用于把测量数据传输到另一个软件包中。
精密星历文件 (*.sp3, *.e18)	用于基线处理的精密星历格式文件。 此文件存储于通用文件区。用GPS处理形式对话框选择此文件。
RINEX 文件(*.Xxo, *.XXn, *.obs, *.nav)	接收机独立交换格式文件。 此格式可从任何GPS接收机生产商传输GPS原始数据文件。 在同一文件夹中需要有导航文件和原始数据文件。
Sokkia 数据记录器文件 (*.sdr)	来自计算机的Sokkia 数据记录器格式的文件。
SSF/SSK 文件 (*.ssf, *.ssk)	用Trimble GPSurvey 软件创建的后处理动态解算文件或后处理静态解算文件。
测量控制器文件 (*.dc)	来自计算机的Trimble Survey Controller格式文件。 当导入 .dc 文件后, 项目将保存所与天线、仪器和棱镜高度相关的GPS向量或观测值。此数据用于计算。
测量设备	直接来自所支持的全站仪、设备、测量数据卡、数字水准和GPS接收机的数据
第三方数据记录器文件	使用外部导入/导出筛选器所提供的用外部导入/导出筛选器提供的第三方数据记录器文件。Trimble Geomatics Office 支持以下第三方格式: Leica GS1-16 SDMS (导入坐标化的点) Nikon AP-700 ASCII 数据 Topcon GTS-700 和 FC-5 格式数据
Trimble 3600/5600 GDM文件(*.job, *.are)	Trimble 3600/5600 GDM数据文件
TDS 测量Pro CE任务文件(*.job)	导入TDS Survey Pro CE任务文件
TDS Survey Pro CE原始文件(*.raw)	导入TDS Survey Pro CE原始文件
Trimble 3300 / 3600 / 5600 Elta M5文件(*.dat)	导入3300 / 3600 / 5600 Elta M5文件
Trimble 3600 / 5600 TDS Coord文件(*.cr5)	导入Trimble 3600 / 5600 TDS Coord文件
Trimble 3600 / 5600 TDS原始文件(*.rw5)	导入Trimble 3600 / 5600 TDS原始文件
Trimble Elta GPS Controller M5文件(*dat)	导入Trimble Elta GPS Controller M5文件


NGS数据页文件(*.dat, *.dsx, *.htm, *.html)选项

可导入国家大地测量(NGS)标准格式数据文件。

Trimble Geomatics Office 假定所有导入到项目中的NGS数据都在NAD-83基准上 (也就是说，它与WGS-84基准一致)。

如果将NGS数据导入到不能识别NAD-83基准的项目，Trimble Geomatics Office不能唯NGS数据是适用的。

注： Trimble Geomatics Office通过名称识别NAD-83基准 (也就是说，任何以NAD-83开始的基准)。

如果基准不与NAD-83相对应，会出现以下警告信息：

警告：投影不是参考NAD1983基准的。这将导致数据按NAD1983基准导入，并不进行到投影基准的转换。是否继续导入？

如果选择继续导入，NGS坐标用项目中定义的基准进行说明。如果该基准不与NAD-83相对应，则导入将不正确。


CAD/ASCII导入格式

要访问导入/CAD/ASCII标签：

1.	选择文件/导入。

2.	选择CAD/ASCII标签。

注： 任何处理ASCII文件的导入格式都应以标准化形式接收数字数据。标准化形式不包含千分号和小数点。

可将自定义格式移到此标签。更多信息，参见Asciiimp.dat文件。

注：也可用拖放导入文件。

使用CAD/ASCII标签导入下列格式：

格式	使用此格式导入 �
AutoCAD 文件 (*.dwg, *.dxf)	使用ASCII和二进制方式的坐标化点和线性工作的.DXF和.DWG文件 (到 .dxf 版本14)。
C & G 标准格式	C & G 软件标准 ASCII 文件。
无应用的C & G	无应用的 C & G 软件的 ASCII 文件。
CMM COR 和LEV 文件 (*.cor, *.lev)	地面管理Bureaux使用的标准 ASCII 格式文件。 使用外部导出筛选器 可提供CMM COR 和LEV 文件的选项。
NMEA 文件	来自NMEA 格式文件 (GGA, GGK, 和 PJK 字符串) 的点。 NMEA是由国家海洋电气组织开发的标准, 此标准定义了在航海导航设备和通讯导航数据间的数据格式。
Pacsoft 格式	Pacsoft 软件标准ASCII 文件。
SDRmap 坐标	SDRmap 坐标文本文件。
TPLANE (LLHE)	Trimble GPSurvey ASCII 文件。
TRIMMAP 图形文件 (*.tgf)	TRIMMAP (或 SDRmap) *.tgf 图形文件。
WILDsoft 格式	WILDsoft 软件格式的 ASCII 文件。
Terramodel Project文件(*.pro)	来自Terramodel Project的点、linework和图层。


自定义导入格式

要访问导入/自定义标签：

1.	选择文件/导入。

2.	选择自定义标签。

注： 或者，用拖放导入文件。

可将自定义格式移到其它标签。 更多信息，参见Asciiimp.dat文件。

使用自定义标签：

 用自定义格式导入数据文件

  添加新的自定义导入格式

  编辑已有的自定义导入格式

  删除自定义导入格式

有以下几种自定义格式：

  定界点

  宽度固定点

  名称，横坐标，纵坐标，高程，代码

  名称，纬度，经度，高度，代码（地方）

  名称，纬度，经度，高度，代码 (WGS-84)

  名称，纵坐标，横坐标，高程，代码

从ASCII文件导入值时，Trimble Geomatics Office可读取的值，使用Microsoft Windows控制面板/区域设置/数字标签中的数字组符号和小数符号。系统也读入标准化形式的值。即，没有数字组符号（千分号）和点作为小数符号。

所有自定义导入格式都被写入Asciiimp.dat文件。


定义ASCII导入格式对话框

  概述和更多信息

使用此对话框定义ASCII导入格式。

要访问它：

1.	选择文件/导入。出现导入对话框。

2.	在自定义标签中，按下列之一进行：

  要创建新格式，点击新建格式。

  要修改已有格式，点击编辑格式。

名称

输入或编辑导入格式的名称。名称出现在导入对话框自定义标签的类型列表中。不允许有重复的名称。

零字符

输入零字符定义导入格式。该域是可选的。此处指定的零字符在导入文件时被注释，表明对于某一特定记录没有有效的值。

如果Trimble Geomatics Office发现了指定的零字符，在将数据添加到数据库时，就不给数据库中相应的域分配任何值。

注： 某些文件类型需要特殊的字符，如'99999.99', '*****' 或相似字符。通过设置，可使Trimble Geomatics Office优先使用指定值。

描述

输入导入格式的描述信息。导入对话框中某格式被突出显示时，状态栏出现该格式的描述信息。该域是可选的。

默认扩展名

输入导入格式的默认扩展名。如 '.dat' 或 '.fbk'。该域是可选的，如果省略， 则假定扩展名为'.txt'。

提示： 要接受所有文件扩展名，输入 '???'

注： Trimble Geomatics Office使用打开对话框中类型域的列表文件。它将文件命名为名称列表中指定的扩展名。Trimble Geomatics Office自动设定名称和扩展名之间的点。

导入

选择恰当的记录类型作为导入的文件的目标类型。它通常是点表格。

自动填充格式

点击自动填充格式，出现插入格式对话框。使用此对话框自动初始化格式页眉和内容定义。更多信息，参见自动填充格式。

格式页眉

使用快捷菜单中相应的域代码可建立一个定义，与导入文件前面的固定部分匹配或跳过该部分。Trimble Geomatics Office在文件开始时使用一次（仅一次）页眉定义。如果导入文件的页眉行不能与定义匹配，则文件读取将中止。这对于文件格式确认是有用的。

注： 要将空行添加到页眉定义中，按Ctrl+Enter。

例如，由域代码[$Skip.Line:7]组成的页眉定义使Trimble Geomatics Office文件跳过文件中前面的七行，并按照格式内容编译文件的其余部分。

格式内容

使用快捷菜单中相应的域代码可建立一个与要读取的文件数据相匹配的定义。如果与某一实体相关的数据定义有很多行，则通过按Ctrl+Enter 开始新的定义行。

关于系统中有效域的更多信息，参见介绍域代码。

导入文件时，Trimble Geomatics Office反复尝试编译定义中域代码所表示的行。如果导入文件内容与定义不匹配，则在导入报告中将记录该情况，程序将尝试在文件中找到与定义匹配的其它数据。

注：Trimble Geomatics Office在页眉定义之后自动以新的一行开始格式内容定义。

格式页脚

使用快捷菜单中相应的域代码可建立一个定义，与导入文件最后的固定部分匹配或跳过该部分。

Trimble Geomatics Office只在文件末尾使用一次页脚定义。如果导入文件中的页脚行不能与定义匹配，文件的读取将中止。这对于格式确认是有用的。

注： 要将空行添加到页脚定义中，按Ctrl+Enter。

Trimble Geomatics Office在内容定义之后自动以新的一行开始格式页脚定义。

关于自定义ASCII导入的例子，参见自定义ASCII导入格式 - 举例。


自定义ASCII导入格式 - 举例

  也请参见

这些例子说明怎样定义某些ASCII导入格式。

例 1

要读入带有以下行的文件：

File Format Version 1.00

Date: 8/11/99

Project: Example

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,TREE

1026,534222.218,263095.934,10.136,TREE

1027,534224.816,263092.579,10.140,POLE

1028,534228.398,263089.101,10.732,FENCE

1041,534236.948,263084.989,11.054,FENCE

1042,534237.326,263087.964,10.982,FENCE

1087,534243.575,263099.773,10.154,MH

格式头可被定义为：

文件格式版本1.00	改变文件第一行
[$Skip.Line:2]	跳过具有未定义内容的下两行

格式内容可被定义为：

[Name],[Easting],[Northing],[Elevation],[Feature Code]

例2

要读入带有以下行的文件：

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 TREE

1026  534222.218  263095.934      10.136 TREE

1027  534224.816  263092.579      10.140 POLE

1028  534228.398  263089.101      10.732 FENCE

1041  534236.948  263084.989      11.054 FENCE

1042  534237.326  263087.964      10.982 FENCE

1087  534243.575  263099.773      10.154 MH

不需定义格式页眉。

格式内容定义为：

[Name:4][Easting:12.3][Northing:12.3][Elevation:12.3] [Feature Code]


自动填充格式/插入格式对话框

点击自动填充格式按钮自动初始化用户定义的格式或导出格式，或数据库报告的内容定义。点该按钮时，插入格式对话框出现。

注： 该按钮出现在以下对话框中：

  文件/导入/定义ASCII导入格式对话框

  文件/导出/定义ASCII导出格式对话框

  报告/自定义报告/定义报告格式对话框

Trimble Geomatics Office给所有数据创建了一组缺省的域代码。这些初始缺省值被作为新格式的基本，可根据需要修改其定义。

页面

页面组可使您控制报告或定义的格式。

注： 创建了报告后，可用HTML编辑器进行进一步的编辑。

固定宽度

选择固定宽度选项在定义中给各域分配默认的固定宽度。

注： 在导入或导出定义中的此选项不会创建默认的页眉信息。

分隔

选择界定选项输入域。选项使您设置报告或定义的域之间的分隔符。

注： 此选项的所有情况下都将创建默认的页眉信息。

域分隔符

使用域分隔符指定在报告或定义的域之间插入的字符。

提示： 各域中都有默认值，但也可在域中输入想要的任何字符。

文字分隔符

使用文字分隔符域指定在报告或定义的文字之前或之后需要添加的字符。

提示：各域中都有默认值，但也可在域中输入想要的任何字符。


导出 - 概述

如何作...	对话框	也请参见

如果需要不同格式的数据，可从项目中导出数据。例如，想要在不同的软件包中使用数据或想要将文件发送到Trimble Survey Controller时。

可从Trimble Geomatics Office项目的不同文件格式输入数据。例如，可将数据导出到：

  Trimble Survey Controller (如果需要文件来完成野外工作，如要素和数据库)

  各种ASCII格式 (如，当需要其它格式的数据时)

 各种常用的GIS格式

  自定义格式 (并定义其格式)

关于所支持的输出格式的描述信息，参见输出对话框。


导出对话框

使用此对话框从项目中导出数据。

要访问它，有以下几种方法：

  选择文件/导出。

  选择导出工具。。

注： 任何输出ASCII文件的导出格式都 输出标准形式的数字数据（无千分号和小数点）。在ASCII文件中导出的数据用Trimble Geomatics Office的单位显示。但是，可以指定不同的单位，以便用导出单位的数据列表进行导出。或者选择文件/项目属性，以此改变Trimble Geomatics Office显示单位。然后在出现的项目属性对话框中选择单位和格式标签。

要在状态栏显示导出格式的描述信息，选中该导出格式。导出格式有以下标签：

  测量

  CAD / ASCII

  GIS

  自定义

新建格式

选中自定义标签时，新建格式按钮有效。

要创建新的自定义报告格式，点击新建格式，用定义 ASCII导出格式对话框定义导出格式。

编辑格式

选中自定义标签时，编辑格式按钮有效。

要修改已有的ASCII导出格式，点击修改格式，用定义ASCII导出格式对话框修改导出格式。关于确定自定义格式的更多信息，参见主题定义ASCII导出格式-举例中的例子。

删除格式

选中自定义标签时，删除格式按钮有效。

要删除自定义的导出格式，点击删除格式，然后确认该操作或者删除。

自定义

使用自定义钮在导出对话框中选择导出选项列表。从检查表选择需要的导出选项。

您可以从自定义对话框添加外部筛选器。外部筛选器是一些分离的程序，可以与Trimble Geomatics Office集成在一起。任何用于Trimble Geomatics Office中的外部筛选器，如果要添加到该系统，必须依从特定的要求。只有导出对话框里当前安装的已选标签筛选器才会出现。

任何筛选程序必须被编译为具有特殊导出功能的Dynamically Linked Library (*.dll) 文件，并且必须被创建为COM（组件对象模块）对象。

如果选择了适当的文件，Trimble Geomatics Office将把筛选器COM对象登记在计算机里，并且按照系统需求改变.dll接口。如果没有成功，系统将报告不能登记此筛选器。如果筛选器被成功安装，则对话框将列出筛选器的简短描述。

更多信息，请看外部导入/导出筛选。

选项

对于已导出文件，点击选项：

  指定已导出数据单位。

  在已导出文件中指定设置。

  改变导出的数据文件坐标系统。

  改变导出数据的选项到设备3300/3600/5600 Elta M5或3600/5600 GDM。

不能设置导出格式时，此按钮无效。

要设置需导出的文件的详细信息，点击选项。如，在AutoCAD (*.dxf or *.dwg)格式中可选择AutoCAD导出选项数据格式 (.dwg, Ascii .dxf, Binary .dxf)、AutoCAD版本号和参考原图。

导出数据的坐标系统

要选择需导出数据文件的坐标系统，点击选项对话框中的改变。如果当前选中的格式没有在文件的坐标系统中定义，该按钮有效。 如果选择了与项目中坐标系统不同的坐标系统，Trimble Geomatics Office要把导出点的坐标从项目坐标系统转换到所选坐标系统、写入导出文件并在所选坐标系统中存储点。

注： Trimble Geomatics Offic中显示的点的坐标值可与写入到文件中的坐标值不同。

导出

如果已用选项工具选择了当前项，可选择是导出所选数据或是导出整个数据库。

两个选项有效：

所选项	导出所选点
整个数据库	导出数据库中的所有点
在没有当前选项时，选项按钮变为无效，导出应用到整个数据库。

数据分类

可选择数据导出的顺序：

1.	选择数据分类框。

2.	从列表中选择一个分类顺序。从以下各项中选择：

数据库顺序	高程
名称	质量
开始时间	数据类型
观测长度

注：  属性窗口中有相同的分类选项。

提示： 如果添加了自己的分类查询，它们将被添加到列表中，更多信息，参见数据库查询-概述主题(链接到该主题)。


导出格式 - 测量标签

  概述和更多信息

使用导出对话框的测量标签，将测量数据导出到文件或设备中。

要访问该标签：

1.	选择文件/格式。

出现导出对话框。

2.	选择测量标签。

可将自定义格式移到此标签。更多信息，参见Asciiexp.dat文件。

此标签包含以下格式：

选项	使用此选项导出 �
到测量控制器的天线信息	到Trimble Survey Controller中的新建天线信息。 例如, 如果 Trimble 开发了新的天线, 使用此导出选项将天线信息传输到 Trimble Survey Controller。
到Trimble Survey Controller (*.dxf) 的背景图	导出到Trimble Survey Controller（版本10或更高版本）的dxf文件。
到Trimble Survey Controller的以逗号分隔的坐标文件 (*.csv)	到Trimble Survey Controller（版本10或更高版本）的csv文件。
到测量控制器的数据字典(*.ddf)	将数据字典文件(.ddf) 导出到运行Trimble Survey Controller。为此，要安装测量控制器设备。 可以在数据字典编辑器中创建.ddf文件。此应用程序是Trimble的 GPS Pathfinder软件的一部分。 注意: 只能上导出.ddf文件到Trimble Survey Controller（版本 7.00）。
到测量控制器的基准网格(*.cdg)	到Trimble Survey Controller (版本7.00或更高版本) 的基准网格。可以调整要传输的基准网格文件的大小(子网格)。Trimble Survey Controller的早期版本不支持基准网格。 执行此选项时, 需要安装测量控制器设备。 注: 只能将当前项目坐标系统中所使用的基准网格文件子网格化, 但是可以导出任何组合的基准网格。
到TDS设备(*.txt)的描述文件	到运行TDS软件的描述文件(*.txt)。执行此选项时, 必须首先安装TDS设备。可以人工创建或从要素代码编辑器程序中导出描述文件。
DTM 点到文件 (*.dtx)	在项目中所选点的Trimble Survey Controller兼容的数字地面模型文件 (*.dtx)。
DTM 点到测量控制器	与Trimble Survey Controller兼容的所选点的数字地面模型文件(*.dtx)，直接导出到Trimble Survey Controller中。 完成此选项，需要安装测量控制器设备。
要素和属性库到 SDR33 文件. (*.sdr)	包含所选库中每个要素码注释记录的SDR33文件。此选项不能导出属性。
要素和属性库到测量控制器 (*.fcl)	要素和属性库到运行Trimble Survey Controller的设备。文件可以包含属性，也可以不包含属性。(如果要导出属性,请选中检查框)。 进行此操作，需要安装测量控制器设备。 来自要素和属性库中的其它信息不会传输到Trimble Survey Controller中(例如, 点形式)。
要素和属性库到TDS设备(*.fcl)	基于到运行TDS软件的设备的、已选要素和属性库的描述文件(*.txt)。进行此操作，必须首先安装TDS设备。属性不导出到TDS软件。
大地水准面文件到测量控制器 (*.ggf)	大地水准网格文件到运行Trimble Survey Controller(版本6更高版本)的设备。在工作时可选择区域。此操作可减少传输的大地水准网格文件的大小。 此操作要求安装了测量控制器设备。 注意: 对于子网格, 必须使用已定义了大地水准面模型的坐标系统。只能对当前使用的大地水准面网格文件子网格化,但可导出任何大地水准面文件。
大地水准面文件到TDS测量Pro (CE)	到运行TDS测量Pro (CE) 的大地水准面文件。 在工作时可选择区域。此操作可减少传输的大地水准网格文件的大小。
NGS 蓝皮书文件	B、G 和 SERFIL 文件。NGS 蓝皮书格式最初用于将GPS基线转换到US 国家大地测量格式，以包含在国家控制网中。
到3600/5600 GDM (*pco)的Pcode文件	到3600/5600 GDM的pcode文件。
Trimble Data Exchange Format	来自 Trimble Geomatics Office 项目的测量数据。此格式用于在Trimble Geomatics Office 项目间复制观测数据。此格式主要用于将数据导出到第三方网平差软件包中。此格式由Trimble定义并用于产生包含测站和坐标、已处理GPS向量、地面观测值、激光观测值、水准和方位信息的ASCII文件。请向网平差软件提供商确认他们是否支持此格式。
SDR 文件(*.sdr)	使用当前项目配置的 .sdr 文件。 点击选项，改变配置项。
STAR*NET 2D 控制点	以 STAR*NET 2D 格式的控制点文件。 只能导出数据库中的带有北向/东向的平面控制点，高程质量不做要求。 采用 STAR*NET 包方式工作时，最好的方式是用合适的编辑器组合控制点和观测值文件，并将其放入一个单个的文件中。
STAR*NET 3D 控制点	以 STAR*NET 3D 格式的控制点文件。只能导出数据库中的带有北向/东向的平面控制点，以及高程控制点。 采用 STAR*NET 包方式工作时，最好的方式是用合适的编辑器组合控制点和观测值文件，并将其放入一个单个的文件中。
STAR*NET 观测值	在项目数据库中以STAR*NET格式的所有的常规观测值。 采用 STAR*NET 包方式工作时，最好的方式是用合适的编辑器组合控制点和观测值文件，并将其放入一个单个的文件中。
测量设备	数据直接到所支持的全站仪、设备、测量数据卡以及GPS接收机。
测量控制器 (*.dc)	在已配置的版本中所使用当前项目的 .dc 文件。 点击选项改变配置。
Trimble 3300 / 3600 /5600 Elta M5 文件	Trimble 3300 / 3600 /5600 Elta M5文件。
Trimble 3600/5600 GDM文件(*.are)	Trimble 3600/5600 GDM面文件。
Trimble Elta GPS Controller M5文件(*.dat)	Trimble Elta GPS Controller M5坐标文件。
TDS测量Pro (CE) 任务文件(*.job)	到TDS Survey Pro CE设备的任务文件。
Trimble 3600/5600 TDS 坐标文件(*.cr5)	到Trimble 3600/5600 TDS设备的坐标文件。
Trimble Data Exchange Format文件(*.asc)	TDEF文件。


CAD/ASCII导出格式

  概述和更多信息

使用CAD/ASCII标签将数据导出到各种ASCII和CAD格式。

要访问导出/CAD/ASCII标签：

1.	选择文件/导出。

2.	选择CAD/ASCII标签。

可将自定义格式移到此标签。更多信息，参见Asciiexp.dat文件。

注：任何输出ASCII文件的导出格式都输出标准形式的数字数据（无千分号和小数点）。如果未用导出数据单位列表改变单位，则输出到ASCII文件的值的单位与当前系统用于显示的单位相同。要改变系统显示单位，选择文件/项目属性。打开项目属性对话框。选择单位和格式标签。

CAD / ASCII标签有以下选项：

选项	使用此选项导出 ...
AutoCAD 文件(*.dxf, *.dwg)	AutoCAD绘图交换或绘图文件。 点击选项可配置数据格式、版本以及原图。
C&G标准格式	C&G 软件标准 ASCII 格式文件。
无引用的 C&G 格式	无引用的 C&G 软件的 ASCII 格式文件。
CMM 文件 (*.cor, *.lev)	由地面管理Bureaux使用的标准 ASCII 格式文件。 外部导出筛选器提供CMM 文件 (*.cor, *.lev) 选项。
DC文件属性注释 (测量控制器V4)	Trimble Survey Controller版本4的 .dc 文件, 带值属性用冒号(:)分隔。用要素和属性库采集到的属性不按此格式导出。
Pacsoft 格式	Pacsoft ASCII 格式文件。
SDMS 格式	测量数据管理系统中的AASHTO 格式的数据。
SDRmap 坐标	SDRmap 坐标文件。
Autodesk 工作手簿文件 (*.fbk)	在 Autodesk's 以'工作手簿' 格式的文件。
TERRAMODEL � P,N,E,Z,20D � 文件(*.pts)	以逗号分隔的基本格式文件。
TPLAN (LLHE)	Trimble GPSurvey ASCII 格式文件。 WGS-84 纬度和经度坐标用此选项导出。
TRIMMAP 图形文件 (*.tgf)	TRIMMAP(或SDRmap)图形文件。
WILDsoft 格式	WILDsoft ASCII 格式文件。


导出格式 - 自定义标签

要访问导出/自定义标签：

1.	选择文件/导出。

2.	选择自定义标签。

可将自定义格式移到其它标签。更多信息，参见Asciiexp.dat文件。

使用自定义标签：

  以自定义格式导出数据文件

  添加新的自定义导出格式

  编辑已有的自定义导出格式

  删除自定义导出格式

有以下自定义格式：

  分隔点

  固定宽度点

  名称，横坐标，纵坐标，高程，代码

  名称，纬度，经度，高度(地方十进制度数)

  名称，纬度，经度，高度(WGS-84十进制度数)

  名称，纬度，经度，高度，代码(地方)

  名称，纬度，经度，高度，代码(WGS-84)

  名称，纵坐标，横坐标，高程，纬度，经度，高度，代码(地方)

  名称，纵坐标，横坐标，高程，纬度，经度，高度，代码(WGS-84)

  名称，纵坐标，横坐标，高程，代码

  道路点

  点 � 放样

  道路 � 切点

  道路 � 信息牌

用户定义格式以字母顺序出现。

注： 导出到ASCII文件的值通常以标准形式写出。也就是说，没有数字组符号（千分位）和小数点符号。不使用Microsoft Windows控制面板/区域设置/数字选项。

所有自定义导出格式都被写入到Asciiexp.dat文件。


要素和属性库选项对话框

使用此对话框将Trimble Survey Controller版本设置为正在导出的版本。

版本

如果选择的版本早于7.00，选择要素和属性对话框中的导出属性框无效。这是因为这些版本不支持属性。


AutoCAD导出选项对话框

使用此对话框将AutoCAD版本设置为正在导出的版本。

数据格式

从相应选项中选择数据输出格式：

  DWG (二元 AutoCAD绘图文件)

  ASCII DXF (标准AutoCAD数据交换文件)

  Binary DXF (二元格式的标准AutoCAD数据交换文件)

注： 数据格式可根据（用户）需要确定。

版本

给导出文件选择相应的AutoCAD版本。这由导出的系统确定。

原图

使用该域参考系统创建的*.dxf 和 *.dwg文件中的块定义的AutoCAD原图。

当Trimble Geomatics Office创建了AutoCAD文件时，试图将项目中使用的标志名称与原图中定义的块相匹配。标志名称的空格与AutoCAD块名称中的下划线匹配。

标志名称与原图中的块名称匹配时，相应的块以所需的比例和旋转状态被插入到导出文件中。不能与原图中的块匹配的标志以点的形式插入。提供的原图(Symbols.dxf)包含系统提供的所有缺省标志的块定义。

注： 原图中的块定义编译为200单位乘200单位，其中单位是导出时的显示单位。200乘200的定义是为了与Trimble标志和线类型编辑器中的网格相匹配。如果想要建立自己的块定义原图，确定块是在200乘200的基础上，以得到正确的标志比例。

浏览

点浏览浏览系统，找到所需的AutoCAD文件。


定义ASCII导出格式对话框

使用此对话框定义ASCII导出格式。

名称

输入导出格式的名称。名称出现在导出对话框自定义标签的类型列表中。不允许有重复的名称。

零字符

输入零字符定义导入格式。该域是可选的。每当数据库的域没有分配值时，Trimble Geomatics Office在文件格式范围内输出指定的零字符。

注： 某些文件类型需要特殊的字符，如'99999.99', '*****' 或相似字符。通过设置，可使Trimble Geomatics Office优先使用指定值。

描述

输入导出格式的描述信息。这一信息出现在状态栏中。该域是可选的。

默认扩展名

输入导出格式的默认扩展名。如 '.dat' 或 '.fbk'。该域是可选的，如果省略， 则假定扩展名为'.txt'。

注： Trimble Geomatics Office在另存为对话框中另存为类型域中指定扩展名。新文件的文件名可输入到文件名域中。显示任何带有所选文件夹的相应扩展名的文件，使它们在需要时可被覆盖。Trimble Geomatics Office自动设定扩展名中的点。

导出

选择一个基本表或查询表，作为导出文件的资料。缺省资料是点记录。它使您可从点表格导出任何记录。

自动填充格式

点自动填充格式自动初始化页眉和内容。更多信息，参见自动填充格式。

格式页眉

输入文字，域代码定义或两者（从快捷菜单），Trimble Geomatics Office将使用它创建导出文件前面的固定部分。该域是可选的。

系统中有效的域代码的详细信息，参见域代码 � 概述。

要将空行添加到页眉定义中，按Enter。

格式内容

输入相应的域代码定义（从快捷菜单），表明Trimble Geomatics Office要将哪些数据从数据库中导出。在该域中必须输入一个输出定义。如果某一实体的数据导出时有很多行，则使用该定义。方法是，按Enter 开始新的定义行。

系统中有效的域代码的更多信息，参见域代码 � 概述。

格式页脚

输入文字、域代码定义或两者（从快捷菜单），Trimble Geomatics Office将使用它创建导出文件最后的固定部分。该域是可选的。

系统中有效域代码的更多信息，参见域代码 � 概述。

要将空行添加到页脚定义中，按Enter。

关于自定义ASCII导出的例子，参见主题定义ASCII导出格式-举例。


定义ASCII导出格式 - 举例

  也请参见

这些例子说明怎样创建某些ASCII导出格式。假定一个项目有以下点：

Name: 1000	East: 534247.541	North: 263104.807	Elev: 10.118	Code: STN

Name: 1024	East: 534220.249	North: 263104.249	Elev: 10.129	Code: MH

Name: 1025	East: 534222.850	North: 263100.894	Elev: 10.133	Code: TREE

Name: 1026	East: 534222.218	North: 263095.934	Elev: 10.136	Code: TREE

Name: 1027	East: 534224.816	North: 263092.579	Elev: 10.140	Code: POLE

Name: 1028	East: 534228.398	North: 263089.101	Elev: 10.732	Code: FENCE

Name: 1041	East: 534236.948	North: 263084.989	Elev: 11.054	Code: FENCE

Name: 1042	East: 534237.326	North: 263087.964	Elev: 10.982	Code: FENCE

Name: 1087	East: 534243.575	North: 263099.773	Elev: 10.154	Code: MH

例 1

导出格式：

格式页眉：

File Format Version 1.50

Date: [$System.Date]

Project: [$Project.Name]

格式内容:

[Name],[Easting:0.3],[Northing:0.3],[Elevation:0.3],[Feature code]

格式页脚

[$System.About]

此格式内容产生以下导出文件 (假定是恰当的日期，Microsoft Windows日期格式设置和项目名称)：

File Format Version 1.50

Date: 8/11/96

Project: Example

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,TREE

1026,534222.218,263095.934,10.136,TREE

1027,534224.816,263092.579,10.140,POLE

1028,534228.398,263089.101,10.732,FENCE

1041,534236.948,263084.989,11.054,FENCE

1042,534237.326,263087.964,10.982,FENCE

1087,534243.575,263099.773,10.154,MH

Trimble Geomatics Office, 版本1.50

例 2

导出格式：

无格式页眉

格式内容:

[Name:4][Easting:12.3][Northing:12.3][Elevation:12.3] [Feature code]

此格式内容产生以下导出文件：

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 TREE

1026  534222.218  263095.934      10.136 TREE

1027  534224.816  263092.579      10.140 POLE

1028  534228.398  263089.101      10.732 FENCE

1041  534236.948  263084.989      11.054 FENCE

1042  534237.326  263087.964      10.982 FENCE

1087  534243.575  263099.773      10.154 MH

注： Trimble Geomatics Office假定新的一行插入到页眉末尾和内容之间。要添加另外的行，按Enter。插入点下移一行，返回到左边缘，并创建空行用于插入新文字。


SDMS格式选项

测量数据管理系统(SDMS)格式，由美国国家公路交通协会定义，由特殊的测量数据格式组成。 可用此格式从Trimble Geomatics Office导出数据。

此选项导出点及其属性注释。这些注释包含另外的点要素。在测量时将这些注释输入到运行Trimble Survey Controller的设备中。Trimble Survey Controller特有的属性注释功能对此有所帮助。另外，用两个字符后跟冒号或空格的识别符来输入注释记录，然后将属信息导出到SDMS文件。

例如，含有I0:信息或I0信息的注释被导出到SDMS文件中，成为I0:information，其中'information'是文字，相连的是SDMS识别符I0。

要将属性注释与创建的SDMS文件中的正确点相联系，在导出时必须选择在Trimble Survey Controller *.dc文件导入到项目中时自动创建的选择集。选择集以.dc文件中的测量顺序保留所有数据（包括记录的注释）。


外部筛选程序 - 概述
外部筛选器 - 概述

Trimble Geomatics Office中有添加外部导入和导出筛选程序的选项。可将这些筛选程序独立于主系统程序，写为具有特殊导出函数的动态链接库(.dll's)。.dll必须创建为目标链接和嵌入(OLE) 模块。这些模块也称为成份目标模块(COM)的目标。

外部筛选程序必须提供以下导出函数：

GetGUID Function

Pascal function declaration:	function GetGUID: TGUID; stdcall; export;

C/C++ function declaration:	GUID __stdcall __export GetGUID()

此函数必须返回分配给系统的独特成分类别OLE识别符(GUID - Globally Unique IDentifier)。获得此独特识别符需要用相应程序产生基本识别信息，如计算机时间，日期和网卡ID等。ID必须是独一无二的，所以可望通过使用大量的数字（由32个数字组成）来得到，根据统计它不太可能出现两个随机数字带有相同的值。GUID的一个例子是07F750A3-594B-11D1-8E4C-0000C04FCAF9。

转换函数

Pascal function declaration:	function Convert(const FileName: WideString): WordBool;

C/C++ function declaration:	BOOL __stdcall __export Convert(BSTR FileName)

这是进行筛选程序实际工作的函数。筛选程序必须能将数据从源文件转换为要在目标文件中保存的相应格式。此函数使Trimble Geomatics Office指定筛选器要创建的目标文件名。 对于导入筛选程序，Trimble Geomatics Office要求筛选程序可产生一个标准文件/打开对话框，可供选择源文件。目标文件名由筛选程序创建的系统来确定，然后传递到筛选程序的转换函数。导入筛选程序创建的文件必须具有有效的 .dc文件格式 (Survey Controller或SDR文件格式)。

对于导出筛选程序，Trimble Geomatics Office要求筛选程序可产生一个标准文件/打开对话框，可供选择目标文件。Trimble Geomatics Office根据下面要讨论的格式函数中定义的文件格式，创建筛选程序的源文件。源文件的文件名被传递到转换函数，筛选程序可识别要进行筛选的文件。Trimble Geomatics Office从数据库根据导出操作定义的选择集标准提取数据。域代码的定义在格式函数中确定，可控制Trimble Geomatics Office写到源文件的数据格式。 导出筛选程序必须读入源文件，将数据转换为相应的导出格式，然后将它写出到指定的目标文件。

GetLongDesc 函数

Pascal function declaration:	function GetLongDesc: WideString; safecall;

C/C++ function declaration:	BSTR __stdcall __export GetLongDesc()

此函数用于在导入或导出对话框中选中导入或导出筛选程序项时，提供Trimble Geomatics Office的状态栏显示的文字。此函数的定义是可选的，如果未定义，则选中筛选程序项时，状态栏没有任何显示。

GetShortDesc 函数

Pascal function declaration:	function GetShortDesc: WideString; safecall;

C/C++ function declaration:	BSTR __stdcall __export GetShortDesc()

此函数用于提供Trimble Geomatics Office的导入或导出对话框中显示的导入或导出筛选程序名，可供选择筛选程序。

格式函数

Pascal function declaration:	function Format: WideString; safecall;

C/C++ function declaration:	BSTR __stdcall __export Format()

只有导出筛选程序需要此函数，它使程序指定Trimble Geomatics Office创建的源文件格式。此函数返回的文字串必须由有效的Trimble Geomatics Office域代码组成。如果在导出筛选程序中未定义格式函数，Trimble Geomatics Office假定格式为 '[Name],[Northing],[Easting],[Elevation],[Feature code]' ，因此创建用逗号分隔的名称，纵坐标，横坐标，高程和要素码值，供导出筛选程序读取。


GPS数据文件(*.dat)选项

.dat文件包含来自GPS接收机的GPS原始数据。这些文件包括事后处理的动态数据和静态数据。GPS .dat文件不包含任何坐标系统信息。

可将.dat文件从下列传送到Trimble Geomatics Office项目：

  Trimble Survey Controller (带.dc文件)

  Trimble测量型GPS接收机

  计算机

注： 如果将.dat文件导入同一项目数次，缺省时DAT Checkin对话框将不选择项目数据库中存在的观测值。


RINEX文件选项

接收机独立交换格式 (RINEX) 是标准的GPS原始数据文件格式，用来从多个接收机制造商交换文件。

要使用此格式，计算机上需要带有以下文件：

RINEX文件	文件扩展名	可选
观测数据文件	*.obs, *.XXo
导航信息文件	*.nav, *.XXn
气象文件	*.met or *.XXm file	此文件可选。
要将计算机上的RINEX文件导入到Trimble Geomatics Office，有以下几种方法：

 使用导入对话框选择RINEX文件(*.obs, *.??obs)。

 使用拖放功能。

选择观测数据文件。如果观测和导航文件名称不同，可在导航文件匹配对话框匹配观测和导航文件。导航到匹配的.nav文件或从导航文件列表中选择。

DAT Checkin对话框在导入GPS观测值之前出现在文件中检核值的地方。确定天线类型和接收机类型是已知的。

当传送了RINEX文件且所有GPS观测值都被导入到项目数据库后，创建了一个与RINEX文件同名的选择集。

当将RINEX文件导入到Trimble Geomatics Office项目后，可使用Trimble Geomatics Office处理GPS基线（如果安装了基线处理模块），并使用时线模块浏览原始GPS观测值（如果安装了基线处理模块）。


测量控制器类别和在Trimble Geomatics Office软件中的处理方式
测量控制器类别和在Trimble Geomatics Office中的处理方式

在Trimble Survey Controller中创建点后，给点分配了点类别。将点导入到项目时，Trimble Geomatics Office使用此类别及用于确定点位置的方法给点分配点质量。重新计算时使用质量来确定点的计算位置。

下表显示了Trimble Survey Controller给点分配的类别，以及在导入它们时Trimble Geomatics Office的处理方式。

类别	描述	导入时的情况
控制	控制类是能够在Trimble Survey Controller中分配给点的最高质量。	导入为点的控制坐标。
正常	正常类赋予除放样点以外的全部测量点。键入的点也属于本类。	导入点的观测值和坐标。坐标得到一个测量质量。
放样	放样类赋予放样期间的测量点。	点的导入观测值和放样细节。您可以在属性窗口放样标签中查看作为放样的细节。
后视	后视类赋予定义在域里的后视点。	在Trimble Geomatics Office中，后视类按正常类处理。
检查	检查类赋予检查观测值或键入为重复点并存储为检查点的位置。	导入带有“激活为检查”类的观测值。
已删除	已删除类赋予被覆盖的点，或者在Trimble Survey Controller中删除的点。	带有已删除类的点不导入到Trimble Geomatics Office项目中。.dc文件中的已删除点列表存在于在文件导入上创建的报告中。


用测量控制器类别分配给.dc文件中坐标和观测值的性质
用测量控制器类别分配给.dc文件中坐标和观测值的质量

Trimble Survey Controller保存GPS位置时，在坐标上可使用不同的观测技术或密码。 所给的点质量取决于观测方法或键入点时给定的质量。

下表显示用Trimble Survey Controller 类别分配给坐标的质量。

坐标方法	分配的质量
键入控制	控制
键入正常	测量
RTK固定	测量
RTK浮动	绘图
L1 码	绘图
自动	未知
WAAS	绘图
广域固定	测量
广域浮动	绘图
RTCM代码	绘图
已复制	已复制点的质量
注： 对于Trimble Survey Controller .dc文件版本7.5或更高版本，如果使用Here键确定基准的位置，则写为自动方法，位置以未知的质量导入。这表明从基准测量的所有点都具有未知的质量。

如果已经进行了GPS点校准，并且结果是保密的，可以将基准的质量设为测量，从基准测得的所有点将会被分配为测量质量。

对于Trimble Survey Controller .dc文件早于7.5的版本，如果使用Here键确定基准的位置，将给基准位置分配测量质量。

下表显示使用Trimble Survey Controller类别分配给观测值的质量。

观测方法	分配的质量
常规	测量
激光测距	绘图
L1 固定	测量
L1 浮动	绘图
L1 码	绘图


导入Leica GSI-16文件

在导入Leica GSI-16格式文件时，Trimble Geomatics Office只读入测量块和与块相关的Rem文字。导入操作使用测站信息特有的文字(记录)。在导入操作时读入并编译以下文字索引：

索引	意义	索引	意义
11	点 Id (测量块识别标志)	82	点纵坐标
21	水平角	83	点高程
22	垂直角	84	站横坐标
31	斜距	85	站纵坐标
32	水平距离	86	站高程
33	垂直距离	87	反映高度
71�79	评注文字 (用于代码和注释)	88	仪器高
81	点横坐标
基于这些文字索引，Trimble建议您在Leica仪器上设置以下站数据和测量数据记录限定值：

站数据限定值	测量数据限定值
点 Id (11)	点 Id (11)
站横坐标 (84)	水平角 (21)
站纵坐标 (85)	垂直角 (22)
站高程 (86)	斜距 (31)
仪器高 (88)	ppm和棱镜常量 (51)
码 (71)	反映高度 (87)
注释 (72)	码 (71)
	注释 (72)
注： 在导入时，软件假定在站记录之后记录的第一个观测值是后视点观测值。第一个评注文字(71)被译为点代码，其它评注文字(72�79)被译为注释记录。


 数字水准文件(*.dat, *.raw)选项

数字水准文件包含数字水准仪中的数据。

支持从以下数字水准仪得到的数据文件：

  Trimble DiNi Digital Level

  Leica NA 2002/3003

导入数字水准文件时，出现数字水准文件导入对话框。

注: 必须用M5格式从Zeiss DiNi数字水准传输数据文件。


NGS蓝皮书导出

NGS蓝皮书导出可使您从Trimble Geomatics Office产生标准国家大地测量(NGS)蓝皮书。

蓝皮书文件由美国政府定义，在进行要呈交到国家空间参考系统的测量时需要它。这些测量的规则包含在蓝色的书中，呈交这些测量结果被称为 �蓝皮书�。

NGS蓝皮书程序创建以下GPS基线的蓝皮书文件：

  NGS

  B � 项目信息

  G � 基线信息

  SERFIL � 包含已有项目中站SSN，ID和站名的ASCII 文件

NGS蓝皮书文件对话框使用与项目中所选的一组独立处理的基线相关的数据。在导出NGS文件之前，必须完成所有野外工作，处理和质量确认。一旦选择了基线并初始化导出，就不能将任何基线添加到蓝皮书对话框，除非重新启动导出程序。

注： 对于NGS蓝皮书导入对话框所需数据的描述信息，参见�导入格式和国家大地测量 (NGS) 数据库的说明�。NGS参考信息可从下列获取： http://www.ngs.noaa.gov/FGCS/BlueBook/


NGS蓝皮书文件对话框

NGS蓝皮书导出筛选程序可使您从Trimble Geomatics Office产生标准的国家大地测量 (NGS) 蓝皮书文件。

NGS蓝皮书文件对话框使用与项目中所选的一组独立处理的基线相关的数据。在导出NGS文件之前，必须完成所有野外工作，处理和质量确认。一旦选择了基线并初始化导出，就不能将任何基线添加到蓝皮书对话框，除非重新启动导出程序。

要访问NGS蓝皮书文件对话框：

1.	选择文件/导出。出现导出对话框。

2.	在测量标签中选择NGS蓝皮书文件。

注： 如果以前已经保存了蓝皮书，系统会提示您是否装载保存过的信息。

使用NGS蓝皮书导出对话框中的标签输入项目的有关信息。

项目标签

此标签包含项目的一般信息。

站标签

此标签包含与所选基线相关的所有站的列表：

  用自动产生按钮填充4个字符的ID和站SN。ID用站名的前4个字符产生。SNs按照顺序从0001开始，或是第一个有效的数字。

  国家代码栏根据项目标签的信息自动填充。

  从列表选择顺序。

  类型栏自动设置为默认的干涉测量卫星相对定位主程序，因为所有蓝皮书的数据都来自GPS采集方法。

  使用SERFIL按钮导入已有的4个字符的站Ids和SNs，使用前一项目的SERFIL。SERFIL必须包含每个站的站名。此格式与NGS SERFIL格式稍有不同，但NGS也可使用该文件。以下是必须使用的格式：

4 character ID   Station SN    Station Name

COWB   0004   COWBOY

任务信息标签

此标签包含所选基线的各次野外任务的信息。交替出现的颜色表示各基线任务。

  开始时间表示任务中所有接收机的最新开始时间，不表示各条基线的开始时间。此时间只在匹配任务和野外记录时用作参考。

  接收机栏自动填充接收机类型和序号。

  天线栏自动填充天线类型。但是，必须输入序号。输入各天线的SN后，就可从下拉菜单中进行选择。

  天线高度 (Meters/APC L1)栏自动用L1相位中心的正垂线测量值进行填充，该测量值由在野外或记录时输入的天线高计算得到。

任务前后天气状况标签

任务前（后）天气状况标签包含所选基线相关的各次观测的天气信息。在进行揃�顺序或上述测量时，需要该域。在项目标签中选择第一次测量时，标签标题中的星号自动被删除。

域	缺省值
干Bulb	摄氏度
湿 Bulb	摄氏度
湿度	百分比
压力	毫巴
  天气代码域通过直接输入代码或使用编辑当前域按钮来填充。

  编辑当前域按钮可使您浏览并从各变量描述信息中选择代码。

  复制到任务前（后）天气状况域用于在天气状况相同时，将任务前天气状况复制到任务后天气状况标签，或进行相反操作。

混合标签

混合标签包含处理的一般信息。

设备

设备按钮可使您浏览、添加和编辑各接收机和天线信息。只列出与项目相关的设备。

确定

确定按钮关闭NGS蓝皮书文件对话框，并将信息保存到各标签。当输入大量数据时，可保存任务，稍后再返回。

导出

导出按钮在所需的域都被填充后变为有效。导出按钮可使您输入各文件的名称，然后选择各文件的位置。缺省的位置是Trimble Geomatics Office\项目\<Project Name>\导出。

注： 当各标签所需的域都被填充后，标签旁的 *被删除。在对话框中没有域需要填充后，导出按钮变为有效。

注： 关于NGS蓝皮书导出对话框各域所需数据的描述信息，参见�导入格式和国家大地测量 (NGS) 数据库的说明�。NGS参考信息可从下列获取： http://www.ngs.noaa.gov/FGCS/BlueBook/


Trimble数据交换格式

 帮助

Trimble数据交换格式由Trimble导航有限公司确定，有以下几项：

  在Trimble Geomatics Office项目间传送测量数据

  将测量数据导出到网平差或其它测量操作的其它应用程序

注： 检查网平差软件是否支持此格式。

要用此格式导入或导出数据，选择导入或导出对话框的Trimble 数据交换格式选项。

以下信息保存在ASCII文件中：

站和坐标	GPS向量
地形观测值	激光观测值
水准测量信息	方位角信息
文件被组织到下列项中：

[General]

此项提供文件内容，项目和不同域使用的单位的一般信息。

[Stations]

此项包含要传送的所有点的名称和坐标。此项中的坐标通常是在地方基准上。单个观测值以站记录形式保存，包含纬度，经度，纵坐标和横坐标。每个记录中还包含椭球高和正高。

站记录也包含坐标分量作为控制，及分配的要素码信息。

[GPS]

此项包括要传送的GPS向量基线。单个观测值以向量记录的形式保存，其中包括：

起始和结束站名称	向量分量
协方差信息	天线高度
处理类型	比率
RMS	参考变量
观测时间和日期
[Terrestrial]

此项包括要传送的地形观测值。单个观测值以TerrObs记录形式保存，其中包括：

仪器点	后视点
前视点	水平角及误差
垂直角及误差	斜距及误差
棱镜常量	仪器高
观测的日期和时间（如果有）	目标高度
[Laser]

此项包括要传送的激光观测值。单个观测值以LaserObs记录形式保存，其中包括：

仪器点	磁偏角
磁方位角	斜距
垂直角	目标高度
仪器高	目标点
观测的日期和时间（如果有）
[Level]

此项包括要传送的水准观测值。单个观测值以LevelObs记录形式保存，其中包括：

在水准测量中的起点和终点	高程差及误差
距离（如果有）	轮数（如果有）
观测的日期和时间（如果有）
[Azimuth]

此项包括方位角记录，其中包含了单个观测值。


大地项目文件
大地模型项目文件 (*.pro)

Trimble Geomatics Office支持大地模型项目文件（*.pro）的格式。

使用Trimble Geomatics Office导入大地模型项目文件(*.pro)到Trimble Geomatics Office项目中：

1.	选择文件/导入。

导入对话框出现。

2.	选择CAD / ASCII标签。

3.	选择大地模型项目文件（*.pro）选项。

打开对话框出现。

4.	选择要导入的文件，点击打开。

注：只有点、linework和图层从大地模型项目文件（*.pro）导入。


TDS软件 � 概述

也请参见

Trimble Geomatics Office 支持来自下列TD软件的文件：

  TDS 测量Pro CE

  TDS 3600车载式

  TDS 5600车载式

可以从您的PC导入和导出TDS文件，或用测量设备导入和导出选项直接从TDS软件来回传输它们。

注：Trimble Geomatics Office不支持TDS控制文件。在传输文件之前，必须从用于主要任务的控制文件导入点。更多信息，参见TDS文件编制。

注：Trimble Geomatics Office不支持TDS的要素和属性。

TDS Survey Pro CE

Trimble Geomatics Office支持来自TDS Survey Pro CE的下列文件：

名称	扩展名	导入	导出	描述
任务	*.job			包含点和坐标信息。当您只想从TDS Survey Pro CE 项目导入点时，导入任务文件（*.job）。
原始	*.raw		X	包含观测信息。当您只想从TDS Survey Pro CE 项目导入点和观测值时，导入原始文件（*.raw）。
描述	*.txt	X		要素代码的简单文本文件，帮助您把点描述输入到TDS Survey Pro CE中。
大地水准面网格	*.ggf	X		从WGS84参考椭球（TDS Survey Pro CE 版本3.5或更高版本）分离。
导出：

  来自RoadLink的道路定义 (*.job, *.rd5, *.tp5)，参见RoadLink 帮助。

  来自DTMLink的DTM (*.dtm)，参见DTMLink 帮助。

有关这些文件的更多信息，参见TDS文件。

Trimble Geomatics Office也为TDS Survey Pro CE 软件的所有版本提供坐标系统支持。这包括：当使用Trimble GPS接收机时，可以支持TDS Survey Pro CE 3.5或更高版本中改良的大地测量功能。从TDS Survey Pro CE 导入的任何文件都包含完整的坐标系统定义，与测量控制器(*.dc)文件中的相同。

注：当用Trimble GPS接收机时，GPS观测值只从TDS Survey Pro CE 3.5或更高版本导入。所有版本都支持来自任何全站仪品牌的地面观测值。

Trimble 3600/5600 TDS

Trimble Geomatics Office支持来自Trimble 3600/5600 TDS软件的下列文件：

名称	扩展名	导入	导出	描述
坐标	*.cr5			包含点和坐标信息。当您只想从Trimble 3600/5600 TDS项目导入点时，导入坐标文件（*.cr5）。
原始	*.rw5		X	包含观测信息。当您想从Trimble 3600/5600 TDS项目导入点和观测值时，导入原始文件（*.rw5）。
描述	*.txt	X		TDS Survey Pro CE. 要素代码的简单文本文件，帮助您把点描述输入到TDS Survey Pro CE中。
导出：

  a road definition (*.cr5, *.rd5, *.tp5) 来自RoadLink的道路定义，参见RoadLink帮助。

  来自DTMLink的Digital Terrain Model (*.dtm)，参见DTMLink帮助。

  有关这些文件的更多信息，参见TDS文件。

从Trimble 3600/5600 TDS软件导入的文件不包含完整的坐标系统定义。文件用只比例坐标系统导入，与测量控制器 (*.dc) 文件相同。

导入文件时，Trimble Geomatics Office使用最近用在TDS Survey Pro CE任务中的比例因子定义坐标系统。

注：当导入Trimble 3600/5600 TDS坐标文件时，如果在您计算机的相同文件夹内，Trimble Geomatics Office将导入坐标（*.cr5）文件，然后导入相关原始文件（*.rw5）数据。如果只想导入坐标，要确认作为被导入坐标文件的同名原始文件不在您的计算机的相同文件夹内。原始文件也可以被个别地导入。


TDS Survey Pro CE 任务文件 (*.job)

Trimble Geomatics Office 支持 TDS Survey Pro CE 任务文件 (*.job) 格式中的数据。

Trimble Geomatics Office 用来：

  导入TDS Survey Pro CE 任务文件到Trimble Geomatics Office项目中。

  导出Trimble Geomatics Office项目到TDS Survey Pro CE任务文件。

您可以用测量设备的导出和导入选项直接从TDS Survey Pro CE软件来回传输文件。

要导入TDS Survey Pro CE 任务文件：

1.	选择文件/导入。

导入对话框出现。

2.	选择测量标签。

3.	选择Survey Pro CE Job 文件 (*.job) 选项，点击确认。

打开对话框出现。

4.	选择要导入的文件，点击打开。

注：TDS Survey Pro CE 任务文件格式包含点和相关坐标。当您只想从TDS Survey Pro CE项目导入点时，使用本选项。

要导出当前的Trimble Geomatics Office项目到TDS Survey Pro CE 任务文件：

1.	选择文件/导出。

导出对话框出现。

2.	选择测量标签。

3.	选择TDS Survey Pro CE 任务（*.job）文件选项，点击确认。

另存为对话框出现。

4.	选择要保存文件的文件夹。

5.	在文件名域中输入文件名，点击保存。

注：如果重复点存在于被导出的选择项内，TDS Survey Pro CE 任务文件将不被创建。要确保被导出的所有点都有单一的名字。


TDS Survey Pro CE 原始文件 (*.raw)

用Trimble Geomatics Office导入TDS Survey Pro CE 的原始文件到 Trimble Geomatics Office 项目中。也可以用测量设备导入选项直接从TDS Survey Pro CE 软件传输文件。 TDS Survey Pro CE 的原始文件格式包含Survey Pro CE 项目的全部信息当您想从TDS Survey Pro CE项目导入点和观测值时，使用本选项。

要导入TDS Survey Pro CE原始文件：

1.	选择文件/导入。

导入对话框出现。

2.	选择测量标签。

3.	选择TDS Survey Pro CE 原始文件 (*.raw) 选项，点击确认。

打开对话框出现。

4.	从希望导入的文件夹中选择文件，点击打开。


Trimble 3600/5600 TDS Coord 文件 (*.cr5)

用Trimble Geomatics Office 进行：

 导入Trimble 3600/5600 TDS 坐标文件到Trimble Geomatics Office项目。

 导出Trimble Geomatics Office项目到Trimble 3600/5600 TDS 坐标文件。

也可以用测量设备导出和导入选项直接从Trimble 3600/5600 TDS软件来回传输文件。

要导入Trimble 3600/5600 TDS 坐标文件：

1.	选择文件 / 导入。

导入对话框出现。

2.	选择测量标签。

3.	选择Trimble 3600/5600 TDS文件 (*.cr5) 选项。

打开对话框出现。

4.	选择要导入的文件，点击打开。

注：当导入Trimble 3600/5600 TDS 坐标文件时，Trimble Geomatics Office导入坐标文件，然后，如果在您计算机的相同文件夹中，则导入相关的原始数据文件（*.rw5）。如果原始数据文件与为导出所选的坐标文件不在相同的文件夹中，则只导入点。

要导出当前的Trimble Geomatics Office 项目到Trimble 3600/5600 TDS 坐标文件中：

1.	选择文件 / 导出。

导出对话框出现。

2.	选择测量标签。

3.	选择Trimble 3600/5600 TDS 坐标文件 (*.cr5) 选项。

4.	点击确认。

另存为对话框出现。

5.	选择保存文件的文件夹。

6.	在文件名域中输入名称，点击保存。

注：如果重复点存在于被导出的选择项内，或者如果点有字母数字名，则Trimble 3600/5600 TDS坐标文件将不被创建。要确认全部被导出的点都有单一的数字名。


Trimble 3600/5600 TDS 原始文件 (*.rw5)

用Trimble Geomatics Office导入Trimble 3600/5600 TDS 原始文件到Trimble Geomatics Office项目中。也可以用测量设备导出和导入选项直接从Trimble 3600/5600 TDS 软件来回传输文件。Trimble 3600/5600 TDS的原始文件格式几乎包含Survey Pro CE 项目的全部信息。当您想从Trimble 3600/5600 TDS项目导入点和观测值时，使用本选项。

要导入Trimble 3600/5600 TDS原始文件：

1.	选择文件 / 导入。

导入对话框出现。

2.	选择测量标签。

3.	选择Trimble 3600/5600 TDS 原始文件 (*.cr5) 选项。

打开对话框出现。

4.	选择要导入的文件，点击打开。


TDS 描述文件 (*.txt)

TDS Survey Pro CE 和Trimble 3600/5600 TDS软件用描述文件自动输入存储在任务中的点的描述。关于描述文件的更多信息，参见 TDS 文件。

Trimble Geomatics Office 用来：

 从要素代码编辑器导出描述文件（*.txt）。

 导出现有描述文件 (*.txt) 到 TDS Survey Pro CE 或 Trimble 3600/5600 TDS 软件中。

 从要素代码库导出描述文件 (*.txt) 到TDS Survey Pro CE或Trimble 3600/5600 TDS 软件中。

如果从要素代码编辑器导出描述文件，参见要素代码编辑器帮助。

如果把现有描述文件导出到 TDS Survey Pro CE 或 Trimble 3600/5600 TDS 软件中：

1.	选择文件 / 导出。

导出对话框出现。

2.	选择测量标签。

3.	选择到TDS Device (*.txt) 选项的描述文件，点击确认。

选择对话框出现。

4.	选择希望导出的文件，点击打开。

另存为对话框出现。

5.	选择TDS设备，点击打开。

文件被导出。

如果从要素代码库导出新建描述文件到 TDS Survey Pro CE 或 Trimble 3600/5600 TDS 软件：

1.	选择文件 / 导出。

导出对话框出现。

2.	选择测量标签。

3.	选择到TDS Device (*.txt) 选项的要素和属性库，点击确认。

选择要素和属性库对话框出现。

4.	选择要导出的库，点击确认。

另存为对话框出现。

5.	选择TDS设备，点击打开。

文件被导出。


Zeiss - 概述

Trimble Geomatics Office 支持来自以下Zeiss 仪器的M5文件：

  Trimble 3300

  Trimble 3600 Elta

  Trimble 5600 Elta

  Trimble Elta GPS Controller

  Trimble DiNi Digital Level

可以从您的PC把M5文件导入或导出到仪器，或用测量设备导入和导出选项直接把文件传输到仪器。

Trimble Geomatics Office支持Zeiss文件，如下所述：

文件格式	已被支持
Elta M5  (只是英文和德文)	是
Rec 500, R4 和 R5	否。 Trimble Geomatics Office CD包括一个必要时在M5和Rec 500文件格式间转换的程序。
Elta Codelist	否

导出

导出网格点名称、代码、描述和坐标到M5文件。其它类似观测值的数据不被导出。

注：已导出文件的坐标采用Trimble Geomatics Office项目所用的小数位写入，但是，Trimble 3300 仪器的小数位最多3位、Trimble 3600/5600 Elta和Trimble Elta GPS Controller仪器的小数位最多4位。

导入

注：M5文件格式不支持全部坐标系统定义。文件用只比例坐标系统导入，这与测量控制器 (*.dc) 文件中导入只比例坐标系统相同。在Trimble Geomatics Office中定义导入坐标系统时，您可以键入比例因子。

单位

M5格式的单位是“m”（米和Namibian米）或“ft”（国际英尺和美国英尺）。

来回导出或导入M5文件时，如果项目和仪器不使用相同的单位，则Trimble Geomatics Office将假设M5文件中的“m”是米、“ft”是国际英尺。

Trimble DiNi 数字水准

注: Trimble Geomatics Office 不导出到 Trimble DiNi 数字水准仪器。

有关从Trimble DiNi数字水准仪器导入的更多信息，请看数字水准文件 (*.dat, *.raw) 入选项。


Trimble 3300/3600/5600 Elta M5 文件 (*.dat)

Trimble Geomatics Office 用来：

  导入 Trimble 3300/3600/5600 Elta M5文件 (*.dat) 到Trimble Geomatics Office项目。

  导出 Trimble Geomatics Office 项目到Trimble 3300/3600/5600 Elta M5 坐标文件 (*.dat)。

也可以通过测量设备导出和导入选项直接从Trimble 3300、3600 Elta或5600 Elta 车载式软件来回传输文件。

要确认Trimble 3300/3600/5600 Elta M5文件(*.dat) 的M5 文件选项在Elta M5文件导入或导出之前已被配置。

要导入 Elta M5 文件 (*.dat)：

1.	选择文件 / 导入。

导入对话框出现。

2.	选择测量标签。

3.	选择Trimble 3300/3600/5600 Elta M5文件 (*.dat) 选项。

4.	点击选项, 打开M5 文件对话框并配置文件。

5.	点击确认接受设置，并返回到导出对话框。

6.	点击确认。

打开对话框出现。

7.	选择要导入的文件，点击打开。

注：

  	导入时M5文件的当地（相对）坐标（例如，“neh”或“xyz”）转换为绝对坐标。

  	导入M5文件后，全部棱镜常数都以“?”出现于Trimble Geomatics Office中。到改变它，在属性窗口的棱镜常数域中输入域中棱镜常数与实际棱镜常数的差值。例如，如果输入的棱镜常数是“20”，实际棱镜常数是“5”，则输入“-15”。

  	Trimble Geomatics Office不支持直角的放样角。导入时，它们转换为地极放样角。Trimble建议您配置仪器，以便只存储网格坐标放样角。

  	Trimble Geomatics Office不支持左边增加的水平角。不要在仪器上使用本设置。

仪器配置

从Trimble 3600/5600 Elta仪器导入平均的2盘观测值，要确认仪器只配置到存储单一值。如果既选择了单一值又选择了平均，Trimble Geomatics Office将会计算出不正确的值。另外，如果只选择了平均，Trimble Geomatics Office将把平均观测值显示为盘1观测值。

Trimble Geomatics Office假定Trimble 3600/5600 Elta仪器始终打开着大气改正。不要关闭仪器上的这些改正。

必要时，必须使用Trimble 3600/5600 Elta仪器的R-MC存储选项和Trimble 3300仪器的MEM/3存储选项，从而保证既有坐标又有观测值数据用于计算。

测站

为了保证在测量之前 Trimble Geomatics Office 能够正确翻译数据，始终要在仪器上执行测站例行工作。

从测站设置的已删除后视记录仍然被导入到Trimble Geomatics Office中。要通过属性窗口禁用这些观测值。

Trimble Geomatics Office不支持多重后视。当在测站例行工作中测量多重后视点时，Trimble Geomatics Office将用最后的点作为后视。

不支持的 Elta 例行工作

Trimble Geomatics Office不支持以下Elta仪器例行工作输出的特殊数据。但是，在大部分情况下，Trimble Geomatics Office仍将从这些例行工作导入观测值：

  垂直面

  面积

  连接的距离

  变换

  Roadline Lite

  多重圆

  3D 面

要导出当前的Trimble Geomatics Office项目到EltaM5文件（*.dat）：

1.	选择文件 / 导出。

导出对话框出现。

2.	选择测量标签。

3.	突出显示Trimble 3300/3600/5600 Elta M5 文件 (*.dat) 选项。

4.	点击选项，打开M5文件选项对话框  并配置文件。

5.	点击确认，接受设置并返回到导出对话框。

6.	点击确认。

另存为对话框出现。

7.	选择保存文件的文件夹。

8.	在文件名域中输入名称，点击保存。


Trimble Elta GPS Controller M5 文件 (*.dat)

在Trimble Geomatics Office中可以：

  导入 Elta GPS Controller M5文件到Trimble Geomatics Office项目。

  从Trimble Geomatics Office项目导出到Elta GPS Controller M5 坐标文件中。

Make sure that you configure the M5 File Options for Trimble Elta GPS Controller M5 files before importing or exporting Elta GPS Controller M5 files.

也可以用测量设备导出和导入选项直接从Trimble Elta GPS Controller软件来回传输文件。

确认在导入或导出Elta GPS Controller M5文件之前配置了Trimble Elta GPS Controller M5文件的M5文件选项。

要导入Elta GPS Controller M5文件：

1.	选择文件 / 导入。

导入对话框出现。

2.	选择测量标签。

3.	选择Trimble Elta GPS Controller M5文件 (*.dat) 选项。

4.	点击选项，打开M5文件选项对话框并配置文件。

5.	点击确认，接受设置并返回到导入对话框。

6.	点击确认。

打开对话框出现。

7.	选择要导入的文件，点击打开。

注：Trimble Geomatics Office 把M5文件的全部坐标只按网格点导入。为了保证Trimble Geomatics Office中的坐标与Trimble Elta GPS控制器上的坐标匹配，您必须在测量开始实施域内校准（变换）。

要把当前Trimble Geomatics Office项目导出到Elta GPS Controller M5文件：

1.	选择文件 / 导出。

导出对话框出现。

2.	选择测量标签。

3.	突出显示Trimble Elta GPS Controller M5 文件 (*.dat) 选项。

4.	点击选项，打开M5文件选项对话框并配置文件。

5.	点击确认，接受设置并返回到导出对话框。

6.	点击确认。

另存为对话框出现。

7.	选择要保存文件的文件夹。

8.	把名称输入到文件名域，点击保存。


M5文件选项对话框

为了使下列文件给导入和导出成形使用M5文件选项对话框：

  	Trimble 3300/3600/Elta M5文件5600

  	Trimble Elta GPS控制器M5文件指定仪器类型，文件标记，坐标设置，并且重复点设置（导入）。

访问选项对话：

用M5文件选项对话框配置以下要导入和导出的文件：

  Trimble 3300/3600/5600 Elta M5 文件

  Trimble Elta GPS Controller M5 文件

指定仪器类型、文件标记、坐标设置和重复点设置 (以便导入)。

要访问选项对话框：

1.	选择文件 / 导出 (或导入)。

2.	选择测量标签。

3.	选择以下一个选项：

  Trimble 3300/3600/5600 Elta M5文件 (*.dat)

  Trimble Elta GPS Controller M5 文件 (*.dat)

4.	点击选项。

文件标记

选择以下一个选项：

  缺省。(Trimble 推荐本选项)

点击高级按钮，查看缺省选项行格式设置和格式预览。

注:  根据您选择仪器类型的不同，缺省值也不同。

  用户定义

用户定义选项允许您改变行格式设置并查看格式预览部分的改变。选择用户定义，点击高级。在高级标记选项对话框中：

a.	指定点名称、代码和描述的起始字符位置。

b.	指定点名称、代码和描述的域宽度。

c.	输入标记数字。

注：如果用户定义的行格式设置无效，Trimble Geomatics Office要求有效的配置设置。

坐标设置

从坐标顺序和高程下拉列表选择要导入或导出文件的坐标顺序和坐标标识。

注：

  	可用的域取决于选择的仪器类型。

  	比可用空间长的点名称、代码和描述在导出时将被截去。

  	带字母数字名称的点不导入到Trimble 3300仪器中。


点 - 概述

点是Trimble Geomatics Office项目中的重点。在导入数据时可将点添加到项目，或用插入点对话框或根据方位和距离插入点对话框添加点。

在测量视图和计划视图中都能看到点。要游览点的详细信息，选择它，并打开属性窗口。

点具有一个计算位置，由重新计算确定。 此位置是用键入坐标和点观测值确定的点的最佳位置。

在测量视图中，点显示为圆点，圆点之间显示观测值。在计划视图中，点根据点样式来显示。数据库允许重名的点。


插入点对话框

用此对话框将点插入到数据库。域根据坐标类型域的选项而改变。

要访问它，有以下几种方法：

  在测量视图中选择插入/点。

  在计划视图中，按以下方法进行：

  选择插入/点。

  点击插入点工具 [image] 。

插入

点击插入，将点插入到数据库。在对话框中可添加其它的（新）点。

注： 在将第一个网格或GPS位置添加到使用未定义的缺省 (Transverse Mercator) 投影的项目时，Trimble Geomatics Office提供相应对话框，帮助正确初始化投影。

关闭

点击关闭，完成插入点操作并退出对话框。

名称

用键盘输入一个名称。名称长度最多为16个字符。

名称中不能使用以下字符：:

  大括号 {}

  方括号 []

  圆括号 ()

  百分比符号 %

  等号 =

  引号 � 或 '

注： 连续插入点时，如果前一输入点的名称以数字结尾，则自动增加名称。

注： 要在项目属性对话框中设置缺省点名称，选择单位和格式标签，然后使用域中的开始自动点名。

坐标信息组

对于每个坐标分量（水平，高程，高度）选择相应的质量。重新计算用这些质量确定点的最佳位置。

在坐标视图中，选择选项 (WGS-84、网格、地方) 来显示坐标信息组。 如果选择网格项，出现以下域：

纵坐标

使用填充域或用键盘输入一个值。如果使用填充域，纵坐标和横坐标域用点击位置进行填充。

横坐标

使用填充域或用键盘输入一个值。如果使用填充域，纵坐标和横坐标域用点击位置进行填充。

如果选择WGS-84或地方项，并将显示WGS-84设置 (在项目属性对话框的单位和格式标签中) 设为L,L,H，则出现以下域：

纬度

使用填充域或用键盘输入一个值。如果使用填充域，纬度和经度域用点击位置进行填充。

经度

使用填充域或用键盘输入一个值。如果使用填充域，纬度和经度域用点击位置进行填充。

任何选项都有以下域：

高程

用键盘输入一个值，或点击已有点。如果点击了已有点，点的高程值将填充到高程域中。

高度

使用填充域或用键盘输入一个值。如果点击了已有点，点的高度值将填充到高度域中。

提示： 要将点沿测量视图中的视准线或计划视图中的轮廓线放置，用填充域时按住Ctrl。可使用填充域得到概略坐标，然后编辑该值。

注： 如果将项目属性对话框的单位和格式标签中的显示WGS-84设置设为X,Y,Z，将出现X,Y,Z域。使用填充域或用键盘输入一个值。如果使用填充域，则用点击位置填充域。

坐标类型

在此域中选择要用于将坐标保存到数据库的选项(WGS-84，地方，网格) 。 选择坐标类型将坐标视图的设置改为一坐标类型相同。

注： 如果要编辑坐标信息域，坐标类型和视图选项设置必须相同。

CAD信息组

该组包含计划视图中可见的点的所有域。

要素码

用键盘输入一个值，或点击已有点。如果点击已有点，则点的要素码值将填充到要素码域。

描述信息

用键盘输入一个值，或点击已有点。如果点击已有点，则点的描述信息值将填充到描述信息域。

图层

按以下几种方式操作：

  从列表中选择已有图层。

  用键盘输入新图层。出现新图层对话框。

  点击已有点。如果点击了已有点，则该点的图层值将填充到图层域。

点样式

按以下几种方式操作：

  从列表中选择已有点样式。

  用键盘选择新的点样式。出现创建点样式对话框。

  点击已有点。如果点击了已有点，点的点样式值填充到点样式域。


方位角和距离点命令

用此命令通过与已知点的方位角和距离插入点。

要访问它，选择插入/方位角和距离点。

出现通过方位角和距离插入点对话框。


通过方位角和距离插入点对话框

用此对话框通过与已知点的方位角和距离插入点。

要访问它，有以下几种方法：

  选择插入/方位角和距离点。

  在计划视图中点通过方位角和距离添加点 [image] 工具。

注： 新点的质量与已知点相同。如果未指定高程差，则新点的高程和高度域未知。

点名称

用键盘输入点名称。名称长度最多为16字符。

名称中不能使用以下字符：:

  大括号 {}

  方括号 []

  圆括号 ()

  百分比符号 %

  等号 =

  引号 � 或 '

已知点

用键盘输入一个已有点名称，或点击已有点。

方位角

此域取决于方位角类型设置。在单位和格式标签的角度格式（度）设置中输入一个方位角值。

距离

此域取决于单位和格式标签中的显示距离设置。如果不指定单位，则使用项目中的当前单位；但也可指定为m，ift (国际尺)或sft (US测量尺)。

高程差

该值与已知点的高程相加，产生新点的高程。正的改变表明新点的高程比已知点大。如果新点的高程比已知点小，则输入的是负值。如果未指定单位，使用项目中的当前单位；但也可指定为m, ift (国际尺)，或sft (US 测量尺)。如果未指定高程差，则新点的高程为空。

方位角

用此组选择网格或沿法截面向前的方位角。

 网格 � 选择此项显示网格方位角

 沿法截面向前 � 选择此项显示沿法截面向前的方位角

方法

用此组选择插入点后软件提出对话框的方法。

  连续的 � 添加新点后，此项将新点的名称插入到已知点域。使用此项输入工作线。

  放射状的 � 将已知点保持不变。使用此项输入从同一点的放射线。

连接

用此框在已知点和新点之间画一条线。该线被添加到当前图层，以当前图层的缺省线样式绘出。它只在计划视图中可见。


 插入方位角对话框

方位角用于确定地形观测值的方向。使用此对话框在两点间插入方位角。

要访问它：

  在测量视图中选择插入/ 方位角。

从点和至点

在这些域中使用键盘或填充域输入已有的点名称。

方位角

如果输入了已有的�从�和�至�点，则显示计算的方位角值。如果需要，可编辑此值或其质量。

如果点对中已存在方位角，系统会提示是否覆盖。此域中显示的方位角取决于方位角视图的设置。

方位角类型

用此域确定数据库中保存方位角的方式；即，网格或沿法截面向前的方位角。

然后选择相应确定对话框中坐标显示方式；即，网格或沿法截面向前的方位角。

这些设置必须是相同的，以便编辑坐标信息域。

 注：如果�至�点没有坐标，网格方位角和沿法截面向前的方位角不能计算，所以方位角显示为空。

插入

用此按钮将方位角插入到项目。方位角显示在两个定义点之间，并用一个箭头显示方向。

关闭

用此按钮关闭插入方位角对话框。


    线命令

用此命令将线插入到数据库。

要访问它，有以下几种方法：

  选择插入/线。

出现插入工作线对话框，其中的线标签已被选择。


   插入工作线对话框

用此框将工作线（直线，曲线或弧段）插入数据库。

要访问它，有以下几种方法：

直线	选择插入直线工具 [image].   选择插入/直线。
曲线	选择插入曲线工具 [image].    选择插入/曲线。
弧	选择插入弧工具 [image] 。    选择插入/弧。

出现插入工作线对话框，相应标签已选择。

使用填充域或用键盘输入详细信息完成对话框。要快速添加工作线，在至点域中双击填充域。

可在任何时间改变工作线类型。这样，也可连接成为直线、曲线、弧段或混合线。

可将三种类型的工作线添加到数据库：

  直线

  弧

  曲线

插入

点击插入，将工作线添加到项目，使对话框保持打开，便于添加工作线。

“从”点值变为下一工作线的“至”点值。


   直线 - 概述

更多信息

帮助...	也请参见
概述

Trimble Geomatics Office中可在点之间插入直线。将直线插入到项目中来定义线的边界（如围栏线，建筑物和管道）。

在计划视图中浏览项目时，直线出现在图形窗口。要浏览直线的属性，选择直线，并打开属性窗口。

直线根据其线样式进行显示。可用Trimble线样式或创建自定义样式。

直线可以一些格式导出(例如AutoCAD和TRIMMAP格式)。


   弧段 - 概述

更多信息

帮助...	也请参见
概述

可创建弧来显示点之间的圆滑弧段。

在计划视图中浏览项目时，弧段出现在图形窗口。要浏览弧段的属性，选择直线，并打开属性窗口。

弧段将根据其线样式进行显示。可用Trimble线样式或创建自定义样式。

弧段可以用一些格式输出(例如AutoCAD和TRIMMAP格式)。


   曲线 - 概述

更多信息

帮助...	对话框	也请参见
概述

插入曲线来创建点之间最相符的曲线。用曲线定义不是直线的边界(例如水流或轨迹)。

在计划视图中浏览项目时，曲线出现在图形窗口。

曲线将根据其线样式进行显示。可用Trimble线样式或创建自定义样式。

每次从另一曲线中使用的点插入一条曲线时，Trimble Geomatics Office重新计算已有曲线，确定显示的是光滑曲线。

曲线可以一些格式导出(例如AutoCAD和TRIMMAP格式)。


   插入工作线对话框 - 直线标签

使用此对话框将直线插入数据库。

要访问它，在计划视图中有以下几种方法：

  选择插入/直线。

  选择插入直线工具 [image] 。

出现插入工作线对话框，其中直线标签已选择。

从点

按以下操作进行：

  使用填充域选择用于确定直线的第一个点。

  输入用于确定直线的第一点的名称。

至点

按以下操作进行：

  使用填充域选择用于确定直线的第二个点。

  输入用于确定直线的第二点的名称。

图层

按以下操作进行：

  选择要将直线添加到的图层。

  输入新的图层名称来创建新图层。出现新建图层对话框。

线样式

选择用于显示直线的线样式。恰当的样式是CAD样式对话框中的线样式。

插入

点击插入，插入直线。至点域中选择的点在从点域中作为缺省选项。必要时可将其改变。

关闭

点击关闭，停止插入直线。


      弧段命令

用此命令将弧段插入到数据库。

要访问它，在计划视图中有以下几种方法：

  选择插入/弧段。

  选择插入弧段工具 [image] 。

出现插入工作线对话框 ，其中弧段标签已选择。


     插入工作线对话 - 弧段标签

用此命令将弧段插入到数据库。

要访问它，在计划视图中有以下几种方法：

  选择插入/弧段。

  选择插入弧段工具 [image] 。

出现插入工作线对话框，其中弧段标签已选择。

从点

按以下操作进行：

  使用填充域并点击相应点。

  用键盘输入点名。

至点

按以下操作进行：

  使用填充域并点击相应点。

  用键盘输入点名。

中心点

要将已有点作为弧段的中心，有以下几种方法：

  输入已有点名称。

  用填充域选择已有点。

点的坐标被复制到域。

中心点纵坐标，中心点横坐标

要将坐标作为弧段的中心，使用填充域点击图形窗口的某一位置。坐标被复制到这些域。

注： 如果输入一个中心点和中心点坐标，则中心点被使用。

小弧段

如果要创建小弧段，选择真项。否则，选择假。两点之间一般有两个可能的弧段，共同确定一个圆。此设置定义要绘出的弧段。在下图对此作出解释：

注： 弧段的中心是中心点，或是中心点纵坐标和中心点横坐标域的坐标。

图层

按以下操作进行：

  选择要将弧段添加至的图层。

  输入新图层名称来创建新图层。出现新建图层对话框。

线样式

选择用于显示弧段的线样式。相应的样式是CAD样式对话框的弧段样式。

插入

点击插入，插入弧段。至点域选择的点在从点域中作为缺省选项。必要时可将其改变。

关闭

点击关闭，停止插入弧段。


      曲线命令

用此命令将曲线插入数据库。

要访问它，在计划视图中有以下几种方法：

  选择插入/曲线。

  选择插入曲线工具 [image] 。

插入工作线对话框，其中曲线标签已选择。


     插入工作线对话框 - 曲线标签

用此对话框将曲线插入到数据库。

要访问它，在计划视图中有以下几种方法：

  选择插入/曲线。

  选择插入曲线工具 [image] 。

出现插入工作线对话框，其中曲线标签已选择。

从点

按以下操作进行：

  使用填充域并点击相应点。

  用键盘输入点名。

至点

按以下操作进行：

  使用填充域并点击相应点。

  用键盘输入点名。

入切线，出切线

要在用于确定曲线的点的基础上自动输入切线值，将值设为<自动>。必要时可输入自己的切线值。

起伏量

输入0和1之间的值。起伏量确定曲线的宽度。

起伏量越大，曲线越宽。

图层

按以下操作进行：

  选择要将曲线插入的图层。

  输入新图层名称来创建新图层。出现新建图层对话框。

线样式

选择用于显示曲线的线样式。恰当的样式是CAD样式对话框中的线样式。

插入

点击插入，插入曲线。至点域选择的点在从点域中作为缺省选项。必要时可将其改变。

关闭

点击关闭，停止插入曲线。


     文本命令

用此命令打开插入文本对话框。

要访问它，在计划视图中有以下几种方法：

  选择插入/文本。

  点插入文本工具 [image] 。


    插入文本对话框

用此命令将文本插入数据库。

要访问它，在计划视图中有以下几种方法：

  选择插入/文本。

  点插入文本工具 [image] 。

文本表达式

输入要显示的文本。要使用域代码 (例如，项目标题)，右击并从快捷菜单选择域。

纵坐标

要输入文本位置的纵坐标值，有以下几种方法。

  通过点击图形窗口某一位置来使用填充域

  用键盘输入纵坐标值

横坐标

要输入文本位置的横坐标值，有以下几种方法。

  通过点击图形窗口某一位置来使用填充域

  用键盘输入横坐标值

方向

输入文本实体的方向。如果不指定方向，文本在窗口水平显示。

固定类型

指定文本相对于纵坐标和横坐标值的位置。从列表选择一个值。

图层

选择要从列表将文本添加到的图层。要在新图层中输入文本，输入新名称。出现新建图层对话框。

文本样式

从列表中选择文本实体的文本样式。如果要使用添加文本的图层中的缺省文本样式，选择<根据图层>选项。

要编辑和创建文本样式，选择编辑/样式。

插入

点击插入，将文本添加到项目，使对话框保持打开，便于添加更多的文本。


文本 - 概述

更多信息

帮助 ...	对话框	也请参见
概述

可在项目中添加文本。例如，添加文本来描述图形，或显示项目标题。

文本显示在图形窗口中。要浏览文本属性，选择文本，并打开属性窗口。也可将文本拖到图形窗口的新位置，或旋转文本。

文本可用一些格式导出(例如AutoCAD和TRIMMAP格式)。


    注释 - 概述

更多信息

帮助 ...	对话框	也请参见
概述

注释是与实体（点，直线和弧段）相关的文本。显示的文本由注释模板确定。

注释模板确定：

  注释的内容

  注释相对于实体的位置

注释模板包含用户定义的文本和域代码。在域被改变时，域代码被扩展。例如，注释点时如果带有高程，则点的高程改变时，注释被更新。

注释保存在项目中。

注释模板

Trimbl提供预定义的注释模板。如果处理要素码，要素和属性库包含注释模板，它们被添加到注释模板列表。要素和属性库的注释模板没有文本样式设置，在注释模板被添加到Trimble Geomatics Office项目时，使用缺省的标准文本样式。

添加注释

要添加注释，在计划视图中有以下几种方法：

  选择插入/注释

  选择编辑/注释模板。点击新建。

  使用要素码处理注释实体。 更多信息，参见Trimble要素和属性编辑程序的在线帮助。

注： 要编辑已有的注释，使用属性窗口。


    注释命令

用此命令注释所选的点、直线或弧段。

要访问它，选择插入/注释。

出现注释对话框。


     注释对话框

  概述和更多信息

用此对话框注释所选点、直线和弧段。

要访问它，选择插入/注释。

图上尺寸的实体注释的插入位置由实体尺度和文件/纸张设置对话框中的绘图比例设置来确定。 在注释和实体之间增加了三分之一字符高的空间。

注释模板

从列表中选择模板。

保留已有模板

选择此框保留已分配给实体的注释。即使是在同一位置时。新的注释也被添加到已有注释中。

提示： 可用此功能给实体提供多个注释，分别在注释模板对话框中的不同图层。

如果清除此框，被分配到实体的注释在添加新注释之前被删除。

注释

注释实体的方法有两种：

所选项	选择此项注释所选实体。
整个数据库	选择此项注释所有实体。
未选择任何项时，这些按钮无效。此时，注释所有实体。

删除

要从所选 实体中删除所有注释，有以下几种方法：

  点击删除。

  选择注释并选择编辑/删除。

模板

点击模板，显示注释模板对话框。用此对话框选择要创建、修改或删除的注释模板。更多消息，参见注释模板对话框。


       注释模板对话框

  概述和更多信息

用此对话框管理注释模板。

1.	选择插入/注释。

2.	点模板。

注释模板确定样式、位置和注释的内容。一旦分配后，各注释就成为独立于注释模板的不连续文本信息。注释保存在项目中。

Trimble Geomatics Office使用域代码指定注释显示的值。注释是可变的-任何域代码都可在原实体改变时重新进行扩展。

注释模板

此列表包含当前项目中的所有注释模板。

要修改或删除已有的注释模板，突出显示相应的模板名称。

新建

点击新建，创建新的注释模板。出现注释模板对话框。

编辑

点击编辑，修改已有的注释模板。出现注释模板对话框。

删除

点击删除，删除所选的注释模板。这将从项目中删除模板。


       注释模板对话框

  概述和更多信息

用此对话框中的标签设置要创建或修改的注释模板。

要访问它：

1.	按以下操作进行：

  选择插入/注释。点击模板。

  选择编辑/注释模板。

出现注释模板对话框。

2.	点击新建或编辑。

用四个标签确定注释模板：

  设置

  点

  直线

  弧段


     注释模板对话框 - 设置标签

  概述和更多信息

用设置标签编辑注释模板的一般设置。

要访问它：

1.	选择插入/注释。

2.	点击模板。

3.	点击新建或编辑。

4.	选择设置标签。

名称

输入一个名称，用于浏览和重命名当前模板。

文本样式

定义注释的文本样式。

要定义注释的文本样式，在计划视图中选择编辑/样式。如果选择<根据图层>项，文本样式沿用注释添加至的图层的文本样式设置。

要设置图层缺省值，在计划视图中选择编辑/ 图层。

点注释方向

输入需要的点注释方向。可使用的方向从00�00'00"到360�00'00"。缺省值为90�00'00"。

图层

放置	要将注释放置在指定的图层，用此选项。可从已有图层列表中进行选择，或输入新图层名称。如果输入新图层名称，应用模板时自动创建此图层。

放置在当前图层

要将注释放置在当前图层，用此选项。当前图层在计划视图中的图层选项工具及图层对话框中显示。

放置在注释实体所在图层

要将注释放置在注释实体所在的图层，用此选项。


     注释模板对话框 - 点标签

  概述和更多信息

用点标签定义用此模板的点的注释。

要访问它：

1.	选择插入/注释。

2.	点击模板。

3.	点击新建或编辑。

4.	选择点标签。

四个位置（左，上，右，浮动）的注释文本最多可有100个字母字符。各位置的值由用户定义的文本和域代码组成。域代码用于从数据库提取注释信息。例如，域代码'[name]'用于用名称注释一点-此时在点的右边。

可联合用四个缺省位置来注释点。要将注释从缺省位置移开，使用鼠标将注释拖到更合适的位置。注释仍与点相联系。

位置	注释显示：

左	在点的左边。

上	在点的上方。

右	在点的右边。

浮动	在点之外但与点相联系的位置。


      注释模板对话框 - 直线标签

用直线标签定义直用此模板的线的注释。

要访问它：

1.	选择插入/注释。

2.	点击模板。

3.	点击新建或编辑。

4.	选择直线标签。

七个位置（如下）的注释文本可达到100个字母字符。各各位置的值由用户定义的文本和域代码组成。域代码用于从数据库提取注释信息。例如，域代码 '[azimuth]' 用于注释带有方位角值（此时在直线的正上方）的直线，域代码'[distance]'注释带有距离值（此时在直线正下方）的直线。

可用七种缺省位置联合注释直线。要将注释从缺省位置移开，用鼠标将注释拖到更合适的位置。注释仍然与直线相联系。

位置    	注释显示：

左上    	在直线左端的上方。

正上    	在直线中间的上方。

右上    	在直线右端的上方。

左下    	在直线左端的下方。

正下    	在直线中间的下方。

右下    	在直线右端的下方。

浮动    	在直线以外但与直线相联系的位置。


     注释模板对话框 - 弧段标签

用弧段标签定义用此模板的弧段的注释。

要访问它：

1.	选择插入/注释。

2.	点击模板。

3.	点击新建或编辑。

4.	选择弧段标签。

七个位置（如下）的注释文本可达到100个字母字符。各各位置的值由用户定义的文本和域代码组成。域代码用于从数据库提取注释信息。例如，域代码'[length]' 注释带有高度值（此时在弧段正上方）的弧段，域代码 '[Radius]'注释带有半径值（此时在弧段正下方）的弧段。

可用七种缺省位置联合注释弧段。要将注释从缺省位置移开，用鼠标将注释拖到更合适的位置。注释仍然与弧段相联系。

位置    	注释显示：

左上    	在弧段左端的上方。

正上    	在弧段中间的上方。

右上    	在弧段右端的上方。

左下    	在弧段左端的下方。

正下    	在弧段中间的下方。

右下    	在弧段右端的下方。

浮动                在直线以外但与直线相联系的位置。


点命令

用此命令将新点插入到数据库。

要访问此命令，选择插入点。

出现插入点对话框。


将实体添加到项目

可在Trimble Geomatics Office中将实体添加到项目。实体定义为点，直线，弧段，曲线，注释或文本。可用计划视图中的插入菜单添加所有这些实体类型。也可在测量视图中用插入菜单添加点。

关于各实体类型的信息，可用以下链接：

  点

  直线

  弧段

  注释

  文本


 当前观测工作线命令

用此命令创建当前观测类型的CAD工作线。要访问它，在计划视图中选择插入/工作线。出现插入观测值工作线对话框。


 插入当前观测值工作线对话框

用此对话框创建项目中所有观测值的CAD线。

要访问它，在计划视图中选择插入/当前观测值工作线。

观测类型

显示观测类型。可能的类型为

RTK向量
后处理	静态，Static, 快速静态和后处理动态
地形观测值	常规，激光测距和归算
CAD 图层

选择将直线添加到观测类型的图层。直线用所选图层的缺省线样式绘出。如果用键盘输入新图层，出现新建图层对话框。


项目属性 - 概述

更多信息

帮助 ...	对话框
概述

项目的属性包括所有项目宽度设置(例如,坐标系统和显示单位)。能在任何时间改变它们。当改变项目属性时，项目就会更新以反映变化。一些项目属性能改变项目数据(例如，改变坐标系统)。

不能取消任何项目属性的变化。


项目属性对话框

使用此对话框设定项目宽度设置。

访问它：

  选择文件/项目属性。

项目属性有下列标签：

  坐标系统标签

  报告标签

  项目详细信息标签

  重新计算标签

  单位和格式标签

  要素标签


项目属性对话框 - 项目详细信息标签

使用此标签输入需要的包括在报告和图形里的项目/模板数据。

访问它：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择项目详细信息标签。

注：在项目详细信息表中，右击访问重命名或删除已有项目，和插入新的项目的快捷菜单。

在此标签里所有域都是可选的。

标题

在此域输入当前项目/模板的标题。

描述信息

如果需要，输入项目/模板的描述信息。

参考

输入能把项目连接到办公室成本计算程序的项目参考数据。

野外测量员

如果需要，输入完成项目的野外测量员的名字。

计算机操作员

如果需要，输入项目计算机操作员的名字。

日期

缺省设置使此域能够记录项目的生产日期。模板项目中此域用日期域代码自动执行。

垂直基准

输入垂直基准的名称。

设备

输入设备的序号。

注：当打开一个模板时，任何域代码的定义都不展开。使用此设备将合适的域代码定义输入进模板。当一个项目第一次打开时，域代码定义被展开。


项目属性对话框 - 坐标系统标签

 概述和更多信息

使用此标签选择和浏览项目的坐标系统。

访问它：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择坐标系统标签。

坐标系统设置

此组显示当前坐标系统的摘要。它给出项目站点，系统，地区，基准和大地水准面模型。

转换按钮打开选择坐标系统对话框 。此对话框是用来选择坐标系统的第一页。

注：使用Trimble Coordinate System Manager工具，创建和编辑坐标系统。

当地站点设置

此组显示站点位置的摘要。它给出项目的纬度，经度，高度,和坐标显示的方法。

转换按钮打开当地站点设置对话框 。在此对话框中能改变项目站点和指定是否要使用地面坐标。

详细说明

详细说明按钮打开坐标系统详细信息对话框。使用此对话框来浏览当前坐标系统投影，基准转换，平差，大地水准面模型和地方站点的全部参数。

如果在项目中进行GPS站点校准，坐标系统详细信息是内在的坐标系统和 GPS 站点校准(平面平差和高程平差)参数的结合。

如果进行网平差，参数就用作平差。

坐标系统或者有站点校准或者有网平差转换参数，不是两者都有。

另存为站点

另存为站点按钮打开另存为站点对话框 。在坐标系统数据库中使用此对话框来保存作为站点定义的坐标系统的详细说明(包括任何当前GPS站点校准)。

一旦命名站点定义，使用它作为将来项目的坐标系统定义。使用Trimble Coordinate System Manage软件， 编辑站点。

注：网平差参数不保存在站点中。


项目属性对话框 - 坐标系统标签

访问此标签：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择坐标系统标签。

3.	点击详细说明。出现坐标系统详细资料对话框。

4.	选择投影标签。

使用此标签浏览投影参数。它显示出投影类型(例如，Transverse Mercator, Lambert,和其它类型)。显示的域取决于投影。

南方方位角域指参考方位角。大多数国家使用北方向作为参考方位角(北方向=0°)。但一些地区,例如南非和夏威夷，使用南方向作为参考方位角(南方向=0°)。在坐标系统中设置投影参数或在Trimble Coordinate System Manager� 工具中定义南方位角坐标系统时，如果在使用这种方法的地区工作，选择此框。

正北方或正南方和东方或西方选项指坐标增加的方向。


坐标系统详细信息对话框 - 基准转换标签

 也可参见

访问此标签：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择坐标系统标签。

3.	点击详细说明。出现坐标系统详细信息对话框。

4.	选择基准转换标签。

使用此标签浏览基准转换参数。它显示出转换方法和用于从WGS-84椭球转换到当地椭球的 参数。当地椭球参数在当地椭球组中显示出。

可得到的基准转换选项是：

  Molodensky (三参数)

  七参数

  多重回归

  基准网格

下列图表给出每个选项的可得到的域：


坐标系统详细资料对话框 - 平差标签

访问此标签：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择坐标系统标签。

3.	点击详细说明。出现坐标系统详细信息对话框。

4.	选择平差标签。

使用此标签浏览平差参数。在站点校准或网平差转换参数的表格中平差用于测量数据：

  计算的 GPS站点校准

  从测量控制器(*.dc)文件输入的校准点

  站点定义

  网平差(如果安装了网平差模块)

注：在校准点垂直平差组中斜北方和斜东方域以百万分比显示(百万分率)。


坐标系统详细信息对话框 - 大地水准面模型标签

访问此标签：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择坐标系统标签。

3.	点击详细说明。出现坐标系统详细信息对话框。

4.	选择大地水准面模型标签。

使用此标签浏览大地水准面模型详细说明。它显示出用于决定GPS站点的高程的任何大地水准面模型的名称和定义文件。

注：使用项目属性/重新计算标签浏览大地水准面模型的质量。


坐标系统细节对话框 - 当地站点标签

访问此标签：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择坐标系统标签。

3.	点击详细说明。出现坐标系统细节对话框。

4.	选择当地站点标签。

使用此标签浏览当地站点详细说明。显示出：

  纬度，经度，和项目站点的高度

  地面比例因子，纵轴加常数，横轴加常数，和是否使用地面坐标


地方站点设置对话框

使用当地站点设置对话框来编辑投影位置，和指定是否在项目中使用地面坐标 。

访问它：

1.	选择文件/项目属性。出现项目属性对话框 。

选择坐标系统标签。

在当地站点设置组中点击转换。

投影位置

使用此组来定义投影位置，使用投影中心的一个点。投影位置在网格，地方的，或 WGS-84坐标中定义。

注：通过在图形窗口中选择位置来输入网格坐标。

必须在项目的开始定义投影位置，因为软件在计算中使用该信息。用于：

  项目纬度计算地球半径

  项目纬度和经度定义网格比例因子

  项目高度作为缺省高程计算高程因子

如果坐标系统未定义，出现缺省项目定义对话框。在选择地面坐标选项前，输入原点的纬度和经度。

使用地面坐标

在项目中如果需要使用地面坐标，选择此复选框。但是，必须首先定义项目坐标系统和站点。

当选择此复选框时，使用地面坐标组的所有项目都变得有效。当第一次使用当地站点设置对话框时，从投影位置复选框计算的比例因子被清除。

注：如果在项目站点组中输入纵坐标，横坐标和高程域，软件仅能计算地面比例因子。

注：如果进行GPS站点校准并且选择使用地面坐标复选框，在项目中定义的校准点变成无效。有警告信息提示继续操作将删除该校准点。

地面坐标显示

地面坐标显示选项改变地面坐标在Trimble Geomatics Office项目中的显示方法。此转换将使区分投影坐标和地面坐标变得更容易。选择下列之一：

  北方向偏移量/东方向偏移量-增量显示的坐标的偏移量。

  四位数坐标-在地面坐标显示中显示四位数。例如，如果投影坐标是 264150.000 ，地面坐标表示为4510.000 。

  五位数坐标-在地面坐标显示中显示五位数。例如,如果投影坐标是 264150.000 ，地面坐标表示为64510.000 。


保存为站点对话框
另存为站点对话框

使用此对话框保存当前坐标系统作为一个站点。

访问它：

1.	选择文件/项目属性。	出现项目属性对话框 。

2.	点击另存为站点。

站点名称

输入保存的站点定义的名称。

确认

点击确认，保存站点。站点保存到坐标系统数据库中。保存的任何站点在Trimble Coordinate System Manager�工具的站点标签中出现。使用站点定义作为将来项目的坐标系统定义。

提示：当使用 Trimble Coordinate System Manager工具时，点击站点标签。站点显示为蓝色。

注：不能将平差转换参数作为一个站点保存。


项目属性对话框 - 单位和格式标签

使用此标签设置在整个 Trimble Geomatics Office中(如在屏幕中显示，输入，输出，和报告时)使用的单位值。

访问它：

1.	选择文件/项目属性。 打开项目属性对话框 。

2.	选择单位和格式标签。

坐标

设置坐标值的显示单位(北方向和东方向)。选项是国际的英尺，令，米，或美国测量英尺。

高程/高度

设置高程显示单位。选项是国际的英尺，令，米，或美国测量英尺。

坐标的小数位

设置显示坐标的小数位个数。能指定直到小数点后的五位数。

坐标顺序

设置坐标顺序。选项是北向第一或东向第一。

显示光标站点

设置状态栏中显示的光标站点。选项是网格，当地的经纬度和WGS的经纬度。

距离

设置显示的距离。选项是测链，国际的英尺，国际的英里，公里，令，米，或美国测量英尺。

距离的小数位

设置显示距离的小数位个数。能指定直到小数点后的五位数。

显示距离为

设置显示距离的类型。选项为：

  椭球距离(水平面距离)

在参考椭球表面上计算的点在两个数据库之间的距离(在零高度)。

  网格

两个结束点的投影坐标之间的毕达哥拉斯距离。即，没有使用投影平差意味着不使用线的投影比例因子。

  地面

以椭球上的平均高度计算的平行于椭球的距离。即，用数学方法计算的用于结束点平均高度的椭球距离。如果使用地面坐标，网格距离应该等于地面距离。描述为：

这里

H	代表数据库高度

R	代表地球半径

DE	代表椭球距离

面积

显示面积单位。选项是英亩，公顷，平方英尺，和平方米。

面积的小数位

设置显示面积的小数位个数。能指定直到小数点后的五位数。

角度单位

设置用于所有水平方向和方位角的角度单位。选项是度，梯度，或密耳。

角度格式(度)

当用度表示时，设置角度或方位角的格式。选项是：

  DDD.dddd	十进制的度

  DDDMM'SS	度，分，秒

  DDDMM'SS.s	度，分，十进制的秒

  DDDMM.mm	度和十进制的分

角度格式(梯度/密耳)

设置角度或方位角的格式为梯度/密耳时，选项是三，四，或五个十进制小数位。

方位角格式

设置方位角值的格式。选项是：

  象限方向(在图表N6207'40“ W中说明)

  整个圆(在图表29752'20”中说明)

显示WGS-84

设置显示WGS-84作为L,L,H 或 X,Y,Z的选项。当插入一个点或使用Trimble Coordinate System Manager�工具的一个点编辑坐标时，对于属性窗口中的点，此设置决定如何显示WGS-84坐标。如果创建带有WGS-84值的自定义的导入，报告或导出格式，也使用此设置。

纬度，经度格式

设置纬度和经度值的格式。选项是：

  DDD.ddddddddd	十进制度

  DDDMM'SS.sssss	十进制秒

  DDDMM.mmmmmmm	十进制分

比率格式

设置比率值的显示和解释。选项是：

   1 英寸到X英尺 度量衡测量单位

  1:X	公制测量单位

显示千位分隔号

设置千位分隔号显示。

选项为是或否。如果选择是，Microsoft Windows系统中设置的的千位分隔号将用于数字的值。为获得更多的信息，参考Microsoft Windows Control Panel的地区性设置。

注：当显示设置为是时, 千位分隔号显示在导入的ASCII文件中，并且用于导出的ASCII文件和报告中。这会引起文件导入失败并且导致导出文件不符合要求的格式。（例如，假如一个用逗号限定的文件使用了千位分隔号的数字值。）域代码修改符 “标准”可用于格式定义，使数字值操作优先于千位分隔号，并且要求小数点为圆点。

显示单位

确定坐标单位是否显示在属性窗口和状态栏中。缺省设置为是。

显示为空

设置空值的显示。

自动开始点的名称

设置自动点的编号方式名。当软件添加或产生坐标时，使用此值。点名自动添加。

坡度格式

设置坡度格式。在Trimble RoadLink�软件中使用和显示。选项是百分比或比率。

边坡坡度格式

在Trimble RoadLink软件中使用和显示。选项是百分比或比率。

比率单位

设置在Trimble RoadLink软件中使用和显示的比率格式的顺序。选项是Rise to Run 或Run to Rise。例如, Rise to Run显示为1:100。Run to Rise显示为100:1。

测站格式

设置在整个Trimble RoadLink软件中显示的测站值格式。格式选项是：

  1000.0

  10+00.0

  1+000.0

  1/000.0

体积单位

设置在Trimble RoadLink 软件中使用和显示的体积单位。选项是立方米，立方英尺，或立方码。

GPS 时间显示类型

确定显示时间的格式。选项是当地时间、GPS时间和UTC时间。


项目属性对话框 - 报告标签

使用此标签来设置项目报告设置。

访问它：

1.	选择文件/项目属性。打开项目属性对话框 。

2.	选择报告标签。

浏览产生的报告

浏览产生的报告选项显示任何由输入，重新计算和要素码处理等操作产生的报告。报告总是由这些操作而产生，并存储在项目报告文件夹的适当文件夹中。

这些选项控制以下处理操作报告的显示：

总是	总是显示执行处理的任何报告--如果在处理期间没有发出错误或警告，那么报告仅由一个标题和与执行的处理操作相关的任何信息组成。
关于错误	如果在任何处理期间发生一个错误，那么自动出现包括错误详细信息的处理报告。
错误提示	如果在任何处理期间发生一个错误，那么出现警告指出发生的错误，使报告详述出现的错误。
从不	在任何处理期间不警告错误发生，不出现详细的报告。


项目属性对话框 - 重新计算标签

使用此标签设置项目的重新计算设置。

访问它：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择重新计算标签。

多重旁点观测值

使用此组指定重新计算如何决定多次观测的旁点位置。 用旁点观测的点没有：

  溢出的观测值

  控制坐标

  静态或快速静态观测值。

使用最优观测值

如果不需要重新计算将旁点观测值平均，选择此选项。点的最优观测值用来确定其位置。此选项以缺省选择。

计算相同类型的观测值的平均数(GPS，常规的，归算的，激光的)

如果需要重新计算将相同类型的每个观测值坐标平均，选择此选项。重新计算不将不同观测值类型获得的坐标平均。例如，由常规观测值决定的坐标不会与用GPS观测值 定的坐标平均。只将旁点观测的值平均。

限差值检查

在重新计算处理期间选择复选框来使用限差值检查。当选择由相同类型观测值计算平均数选项时，重新计算使用限差值检查决定坐标平均值。

设置测量，制图，和未知质量定位的限差值。

限差值用来决定显示于有多重坐标或观测值的点的闭合差。如果从所有观测值和坐标获得的坐标在限差值之外，则报告闭合差并且在点上出现警告标志。超过限差值的误差在属性窗口/警告页 中显示。

水平的

输入一个定位值的水平分量的限差值。

垂直的

输入一个站点的垂直部分的限差值。

归算地面观测值到椭球(海平面改正值)

在重新计算期间如果需要常规观测改正到椭球上的距离，选择此复选框。

除非已知存储在数据库中已经有使用的改正值的域距离观测值，或者输入的坐标是地面坐标而不是网格坐标，否则应该使用海平面改正值。如果不使用改正值，且不采集在海平面上显著高度的常规数据，那么计算的坐标将不正确。

此改正值不适用于GPS数据，因为此数据总是根据WGS-84椭球来采集。

注: 如果正在把 GPS和大地测量结合起来，则您必须把观测值归算到椭球。

注：使用单位和格式的选项 中的显示距离为选项来控制如何报告数据库点之间的距离。当将此选项设置到地面距离时，可浏览任何测量的地面距离的水平分量。

要获得更多的信息，参见主题海平面改正 。

大地水准面模型质量

选择用于项目的大地水准面模型质量。如果在5米精度以内，选择制图。如果已知大地水准面模型的测量精度，选择测量选项。重新计算使用此质量来决定高程的质量(对于 GPS 点)或从大地水准面模型得出的高度(对于地面点)。如果没有用于项目坐标系统的大地水准面，此域无效。


项目属性对话框 - 要素标签

使用此标签指定项目的要素和属性设置。

访问它：

1.	选择文件/项目属性。出现项目属性对话框 。

2.	选择要素标签。

导入时进行要素编码

当导入设备文件时，选择导入要素码复选框自动处理要素码。选择需要用于自动处理要素码的要素和属性库。

注：如果选择此项，在计划视窗中，使用工具菜单仍然能处理要素码，并且选择任何要素和属性库来使用。（在这里不必使用所选的库。）

库

输入需要使用的要素和属性库的名称或点击浏览查找。除非选择要素码复选框，否则此域无效。

属性

为属性建立项目/模板，选择使用属性复选框。

此域仅指用于属性定义的库。

库

要选择库，在库域输入路径和名称，或点击浏览。

浏览

点击浏览并且确定需要的数据字典(*.ddf)文件或要素和属性库(*.fcl)文件。缺省文件夹是 Trimble Geomatics Office系统文件夹。

如果在数据库中没有包含要素的任何点，能改变与项目相关的要素和属性库。

但是，一旦输入一个包含属性的Survey Controller (*.dc)文件，或添加属性用于属性窗口，不能改变用于建立项目属性的要素和属性库。确定在项目中有一致的属性数据。


Trimble Geomatics Office 软件文件-概述
Trimble Geomatics Office 文件 - 概述

计算机上安装的Trimble Geomatics Office包括几个存储系统和各项目设置的文件。

警告：除非是必要时，不要编辑这些文件。可能引入误差，使Trimble Geomatics Office不能按照要求工作。如果需要编辑这些文件，首先做一个备份。

这些文件分为下列部分：

Trimble文件位于程序文件\普通文件\Trimble 文件夹中：

 Current.csd.

  Antenna.ini

  Receiver.ini

Trimble Geomatics Office 系统文件

位于程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹中：

  Asciiexp.dat

  Asciiimp.dat file

  Asciirpt.dat

  Html files

  Symbols.sym

  Linetype.ltp

  Default.fcl

  Frm files

项目文件

位于每个项目的根目录中(一般为 C:\Trimble Geomatics Office\Projects\<project name>:

  Options.ini

  TGO_v150.mdb

  TGO_v150.dbs


Options.ini文件

  也可参见

Options.ini 文件与每个项目相关。位于项目名称的文件夹。此文件控制显示在属性窗口，点摘要，和报告标题中的数据。

Options.ini 文件分成三部分：

  [摘要]

  [报告]

  [标签]

配置摘要定义

在Options.ini文件中的摘要定义可以指定显示在状态栏上作为被选点的详细说明，当把鼠标指针放在一个点上时，显示工具提示。在缺省的情况下它被设置成[名称]：[要素码]以便于概述点的名称和要素码。

如果愿意按名称和由“/”隔开的点式样来概述点，定义Options.ini 文件的[摘要]部分为：

Point=[名称]/[点式样]

对于线，弧，曲线，和文本实体也能分配特定的摘要。例如，对于线如果需要报告方位角和距离作为摘要，在[摘要]部分中添加下列定义：

Line=Az :[方位角] Dist :[距离]

包括文本和摘要说明中的文件代码。

在缺省的情况下对于线，弧，和曲线，摘要是被逗号隔开的开始的点和结束的点的点摘要。

配置报告标题

[报告]部分可以指定包括在所有使用单个域代码[ $Report.Heading ]产生的报告中的标准报告标题。报告标题由文本和域代码混合组成。使用“ \n ”显示新一行开始的地方。将标题隔开几行。例如在标准报告标题中可包括公司名称。

配置标签选项

[标签]部分可以添加显示在标签对话框中的新的标签选项。

使用域代码和文本的混合物来定义标签定义。使用“|”字符来隔开每个标签选项，并且再隔开标签选项的名称和实际显示为标签的文本。例如，直接在标签选项的最后使用键盘输入下列：

|描述|[描述]

将在称为“描述”的标签对话框中添加新标签选项。当选择时，标记的每个点将显示它的描述域值。

注：对于线，曲线，或弧不能定义标签选项。


TGO_v150.mdb文件
TGO_v160.mdb文件

 也可参见

WARNING: Trimble Navigation Limited只用Trimble专有的Trimble Geomatics Office来支持数据库的使用和修改。Trimble不支持或不授权借助其它软件应用程序的数据库的使用、修改或性能保证。Trimble可以在任何时候修改数据库的格式，使之与其它应用程序不兼容。

每个项目都有命名为TGO_v160.mdb的Microsoft Access Database (*.mdb)文件。位于项目文件夹。此文件包括所有表格和查询等项目数据。如果Microsoft Access (访问 2000或以后的)：

  浏览项目数据

  产生自己的查询


TGO_v150.dbs 文件
TGO_v160.dbs 文件

第一次关闭新的Trimble Geomatics Office项目时，产生一个数据库计划(*.dbs)文件。它是基于Microsoft Access Database(*.mdb)文件的。

.dbs文件和.mdb文件都位于项目根文件夹。

产生询问以后，如果添加一个自定义询问到数据库，需要删除此.dbs 文件。

在下次打开项目时，产生一个新的.dbs文件(包含新的询问)，询问变得可用。


Antenna.ini 文件

在Trimble Geomatics Office中，此文件包含可用的GPS天线。它可在此软件中使用，也可被其它Trimble软件使用。


Receiver.ini 文件

此文件包含可用的接收机的列表。不应编辑此文件。

警告：除非必要时，不要编辑这些文件。可能引入误差，使Trimble Geomatics Office不能按照要求工作。如果需要编辑这些文件，首先做一个备份。


Asciiexp.dat文件

此文件位于程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹。

它包含所有的ASCII和Trimble Geomatics Office的自定义导出格式。每次访问导出对话框时，读取此文件。

访问此对话框，有以下几种方法：

  选择导出工具 [image].

  选择文件/导出。

下列符号显示在显示格式的标签上。在此文件中仅仅包括ASCII定义：

符号	标签
=	测量
+	CAD/ASCII
*	GIS
无	自定义

仅能编辑自定义标签中的相应格式。因此，如果需要编辑CAD/ASCII标签中格式中的一种，删除在格式定义的开始处的加号(+)。

例如，包括在 Asciiexp.dat 文件中的下列行：

+SDRmap 坐标

编辑此格式中的一个，删除加号(+)。

当下次访问输出对话框时，显示在自定义标签中的格式和编辑按钮变得可用。

同样，能把自定义格式转变成不能通过在格式名称的开始处插入一种符号来编辑的格式。

例如，Asciiexp.dat 文件中包括下列行：

限定的点

把这行改变为：

+限定的点

当下次访问输出对话框时，显示在CAD / ASCII标签中的格式和编辑按钮是不可用的。


Asciiimp.dat 文件

此文件位于程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹中。它包含所有的ASCII和Trimble Geomatics Office的自定义导出格式。每次访问导出对话框时，读取此文件。

访问此对话框，有以下几种方法：

  选择导入工具 [image].

  选择文件/导入。

下列符号显示在显示格式的标签上。在此文件中仅仅包括ASCII定义：

符号	标签
=	测量
+	CAD / ASCII
无	自定义

仅能编辑自定义标签中的相应导出格式。因此，如果需要编辑CAD/ASCII标签的格式中的一种，删除格式定义的开始处的加号(+)。

例如, 包括在Asciiimp.dat文件中的下列行：

+WILDsoft格式

把此格式转换成能编辑的格式，删除加号(+)。

当下次访问导出对话框时，显示在自定义标签中的格式和编辑按钮变得可用。同样，能把自定义格式转变成不能通过在格式名称的开始处插入一种符号来编辑的格式。

例如， Asciiimp.dat文件中包括下列行：

限定的点

把此行改变为：

+限定的点

当下次访问输出对话框时，显示在CAD / ASCII标签中的格式和编辑按钮是不可使用的。


Asciirpt.dat 文件

此文件位于程序文件\Trimble\Trimble Geomatics Office\系统文件夹中。对于Trimble Geomatics Office，它包括所有数据库报告格式。每次访问附加报告和自定义报告对话框时，读取此文件。

访问附加报告对话框，选择报告/附加报告。

访问自定义报告对话框，选择报告/自定义报告。

能把来自于附加报告对话框的任何系统数据库格式转换成通过从文件中的格式名称删除等号(=)来编辑的格式。

例如， 包括在 Asciirpt.dat 文件中的下列行：

=Points

移动等号(=)，产生能编辑的格式。

格式现在显示在能被编辑的自定义报告对话框中。同样，能把自定义报告对话框中的自定义格式转变成不能通过在格式名称的开始处插入一个等号(=)来编辑的格式。

例如， Asciirpt.dat 文件中包括下列行：

固定宽度点的列表

把此行改变这：

=固定宽度点的列表

格式现在显示在附加报告对话框中，且不能被编辑。


.html文件

许多模板Hypertext Markup Language (.html)文件安装在程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹中。这些模板用来产生系统报告。不应该删除这些文件。

由Trimble Geomatics Office产生的报告(例如, Recompute.html)存储在适当的项目报告文件夹中。打开一份.html报告,在Microsoft Windows Explorer上双击报告。在缺省HTML浏览器中打开它。

注：能修改这些.html文件设置，来定义显示在系统报告中的信息。但是，Trimble不支持或不保证被修改的.html文件将按照要求执行操作。Trimble建议在改变它之前做一个任何.html文件的备份。


Symbols.sym文件

符号(*.sym)文件位于程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹中。

使用Trimble Symbol Editor�工具来浏览和编辑此文件。此文件包括符号。在Trimble  Geomatics Office软件或Trimble Feature and Attribute Editor�工具中，使用此文件中的相应符号能产生新的点样式。

也能产生自己的.sym文件。要获得更多的关于使用.sym文件的信息，参见Trimble Geomatics Office Software User Guide的相关章节。


Linetype.ltp文件

线型(*.ltp)文件位于程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹中。使用Trimble Line Type Editor�工具来浏览和编辑此文件。

文件包含线类型。在Trimble Geomatics Office,或 Trimble Feature and Attribute Editor�工具中，使用此文件中相应的线类型能产生新的线样式。

也能产生自己的.ltp文件。要获得更多的关于使用.ltp文件的信息，参见Trimble Geomatics Office Software User Guide的相关章节。


Default.fcl 文件

Default.fcl 文件位于程序文件\Trimble\Trimble  Geomatics  Office\系统文件夹中。使用 Trimble Feature and Attribute Edito工具，浏览和编辑此文件。所有的.fcl文件都是要素和属性库。

此文件包含预先定义的要素码(具有或没有属性)，点样式，线样式，注释样式和控制代码。

要使用此文件：

1.	将它转移到 Trimble Survey Controller中采集要素码信息。

2.	如果正在采集属性信息，在Trimble Geomatics Office中使用文件来处理要素码和建立项目属性。

使用 Trimble Feature and Attribute Editor�工具能产生自己的要素和属性库。要获得关于产生要素和属性库的信息，参见Trimble 要素和属性编辑器的在线帮助。


Current.csd文件

Current.csd 文件位于程序文件\Common  Files\Trimble\Geodata 文件夹中。

对于Trimble Geomatics Office，Current.csd 是坐标系统数据库。对于一个项目，当选择一个坐标系统时，使用此文件。

使用 Trimble Coordinate System Manager�工具，浏览和编辑此文件。要获得关于产生坐标系统的信息，参见Trimble 坐标系统管理器的在线帮助。


.frm文件

计划表格模板作为.frm文件被存储。它们位于程序文件\Trimble\Trimble Geomatics  Office\系统文件夹中。

当设置打印或测绘纸张设置时，必须选择一种计划形式来使用。

注：.frm文件是文本文件。使用一个文本编辑器来浏览和编辑它们。


Microsoft Access 2000

警告：Trimble Navigation Limited只使用Trimble专有的Trimble Geomatics Office来支持数据库的使用和修改。Trimble不支持或不授权借助其它软件应用程序的数据库的使用、修改或性能保证。Trimble可以在任何时候修改数据库的格式，使之与其它应用程序不兼容。

Trimble Geomatics Office使用Microsoft Access 2000数据库。如果使用Microsoft Access软件的早期版本，不能打开<project> .mdb 文件。如果使用Microsoft Access 2000 (或以后的)，能使用此软件来浏览项目数据和产生新的询问。


数据库询问 - 概述

更多信息

 帮助 ...

警告：Trimble Navigation Limited只使用Trimble专有的Trimble Geomatics Office来支持数据库的使用和修改。Trimble不支持或不授权借助其它软件应用程序的数据库的使用、修改或性能保证。Trimble可以在任何时候修改数据库的格式，使之与其它应用程序不兼容。

概述

Trimble Geomatics Office使用Microsoft Access 2000数据库。能使用Microsoft Access来产生自己的询问。

注：Trimble不支持任何用户自定义的询问。

在Trimble Geomatics Office中，此处的详细说明提供适用的询问设计的有限信息。如果需要回顾这些技术，建议参考与Microsoft Access相关的文件。

定义Microsoft Access询问

通常，需要定义在项目使用的询问能在项目模板中预先定义。

可导出Microsoft Access数据库之间的询问定义。因此，如果有用的询问定义已经在一个特别的项目中产生，随后将这些定义导出到主项目模板，以便在其它的Trimble Geomatics Office Geomatics项目中使用。

在Trimble Geomatics Office中，使用Microsoft Access询问的关键是在询问中指定的ID域，用于定义询问所选择的实体类型。

在选择询问中涉及ID域使用的两个条件：

询问必须与第一输出列一起定义(选择列的显示框)成为一个ID域或一张完整的表格(*使用的选项)。

如果询问用来设计选择多重的实体类型(例如，选择与弧实体相关的所有点)，那么与每个所选实体相关的ID域必须是询问中的唯一输出域。

定义适合于Trimble Geomatics Office的询问

如果需要定义一个用于Trimble Geomatics Office中的询问，必须在询问名称前正确添加前缀，这样，询问显示在必需的表中。

注：在报告和输出询问中，选择集数据表格必须在询问名称中被引用。例如，对于输出点列表，询问被称为Export(Point)_Point List。

如果产生一个适合于选择目的的询问，并且想要它显示在选择/通过询问列表中，询问必须有前缀Select_。当产生自定义报告时，具有Select_前缀的任何询问都是有效的。

如果只为了报告需要设计一个询问，使用报告(Selection Set data table)_前缀。具有报告(选择集数据表) _前缀的询问将不显示在选择/通过询问列表中。

在属性窗口选择列表中，如果需要添加一个询问来过滤外部项目，使用SS_前缀。当在属性窗口中点击过滤器工具时，询问在列表中显示。


Microsoft Access中询问的合格参数

警告：Trimble Navigation Limited只使用Trimble专有的Trimble Geomatics Office来支持数据库的使用和修改。Trimble不支持或不授权借助其它软件应用程序的数据库的使用、修改或性能保证。Trimble可以在任何时候修改数据库的格式，使之与其它应用程序不兼容。

在不同时期使用相同的自定义询问用于选择不同的实体，可能指定作为Microsoft Access软件.的询问定义一部分的参数。

当参数被指定时，Trimble Geomatics Office要求在开始询问时输入适当的值。询问中参数使用的一个例子是通过要素码选择点实体的询问。

例如，能选择在一个阶段具有要素码“树”的所有点，和在以后阶段具有要素码“杆”的所有点。

通过在方括号(即,[])中输入与标准域中的比较条件一起显示(即,=,>,<,等等)的提示信息，来指定询问定义中列的参数。

例如，在通过要素码选择点的询问的情况中，要素码域需要添加到询问定义中。标准域需要定义遇到的条件，例如:“Like [Code]”。

在此例子中，Like这个比较运算符用来检查匹配代码。

在询问参数的说明中可以进一步改进。通过在图形模型中点击实体填充Trimble Geomatics Office参数输入域。此改进由带有冒号的下列参数提示符定义，然后填充数据库域的名称。在以上代码例子中它将变成：
Like [Code:Feature code]

在标准域中除了定义参数条件外，也必须把参数定义输进询问对话框中。当指针在询问对话框的上面部分时，对话框从快捷菜单中出现。

注： 参数域必须包含与输进标准域的方括号中完全相同的文本。

每个参数的数据类型域都是根据输入的数据类型来设置。在上面的例子中，因为要素码是文本类型域，所以被设置成文本。如果指定了一个真正的数字参数例如点高程，那么数据类型域应该设置成双精度。

此处的说明提供用于Trimble Geomatics Office的询问设计的有限信息。如果需要回顾这些技术，建议参考与Microsoft Access相关的文件。


使用自定义询问过滤选择集

警告：Trimble Navigation Limited只使用Trimble专有的Trimble Geomatics Office来支持数据库的使用和修改。Trimble不支持或不授权借助其它软件应用程序的数据库的使用、修改或性能保证。Trimble可以在任何时候修改数据库的格式，使之与其它应用程序不兼容。

使用Microsoft Access，可能产生与选择集数据表格一起使用的更复杂的询问，并且让选择询问有效地过滤数据库选择集。

选择集数据表格包含任何选择集中的所有实体的记录ID。

完成此过滤功能，选择集数据表格必须与包含所选实体的表格(例如，点表格)一起包括在询问定义以内。在这种情况下，必须将选择集数据表格中的记录ID域加入到询问中其它表格的适当ID域。在两个表格中加入域能够通过把一个表格中适当域的名称拖拉到另一个表格中的域名称来执行。

与以上讨论的其它选择询问一样，在询问中首先显示的域必须是ID域或整个表格。询问仅仅为了从特定的表格中选择实体，询问必须定义包含从选择集数据表格中被选择的实体的表格名称。这意味着如果点正在被选择，选择集数据表格的表格名称域必须被添加到询问中，并将标准设置成“点”。

选择集数据表格包含任何选择集中的所有实体的记录ID。每个选择集分配一个在选择集数据表格的选择集名称ID列中列出的唯一识别号码。数字0显示实体是当前选择集的一项，因此询问能使用此值来确定被过滤的唯一当前选择集。此操作通过把更多的列添加到询问，定义选择集名称ID和将标准设置为0来进行。如果需要，设置标准为其它值，可使您基于已有选择集来做当前选择。

此处的说明提供了用于Trimble Geomatics Office的询问设计的有限信息。如果需要回顾这些技术，建议参考与Microsoft Access相关的文件。


项目模板 - 概述

更多的信息

帮助...	对话框
概述

当产生一个新项目时，必须选择一个模板。一个模板包含所有的设置，数据和文件结构。当创建它时，模板中的信息被拷贝到项目。例如，对于模板，如果在Checkin 文件夹中有一个Survey Controller (*.dc)文件, 在Checkin 文件夹中的项目有相同的.dc文件。任何对项目所做的编辑都不会应用到模板。

模板用于：

  选择需要使用的CAD式样

  将控制点添加到数据库

  添加任何需要的文件

  选择适当的坐标系统

  选择需要的单位

  选择重复点设置

Trimble提供许多带有Trimble Geomatics Office的模板。例如，使用公制的模板，可以在整个项目产生过程中使用公制度量衡。

模板存储在程序文件\Trimble\Trimble  Geomatics  Office\模板文件夹中。


重新计算报告 命令

用这个命令去查阅重新计算报告。这个报告由测量数据最新的重新计算结果生成。

要进入这一选项，选择菜单报告 / 重新计算报告。

报告通过你的网络浏览器显示。


系统报告 - 概述

 也可参见

系统报告在处理操作或测量数据计算后生成。这些报告文件生成在报告文件夹中。除了导入的报告，当新报告生成后，都将覆盖已经存在的同名的报告文件。

下面的报告在系统完成处理过程后自动生成：

  导入报告

  重新计算报告

  要素码处理报告

  项目粘贴

要接收有关这些报告的告示，在项目属性对话框 - 报告标签中选择浏览产生的报告选项。

用户在执行完测量操作后可以生成如下的系统报告。这些报告提供了测量计算或测量数据变化的细节信息。

  重新计算

  测点来源报告

  GPS 基线处理报告 (假如用户已经安装了WAVE 基线处理模块)

  GPS 闭合环报告

  网平差报告 (假如用户已经安装了Network Adjustment网平差处理模块)

  GPS测站校准报告

  坐标转换报告

  程平差报告

  反向报告

  重命名点报告

  水准报告

注: 某些报告文件能否得到依赖于用户是否安装了相应的模块（基线处理模块和网平差模块）。


数据库报告 - 概述

 也可参见

数据库报告是用户从数据库所定义的主表格和查询中生成的报告。也就是说，它们报告项目数据库中的信息。

如果用户需要获得项目的概况或者要向客户提供资料，那么这些报告就是非常有用的。

数据库报告可细分为两类：

  系统数据库报告

  通用报告

这两种报告都可以通过附加报告 对话框进入。

用户可以利用或修改已经存在的由Trimble Geomatics Office提供的数据库报告 ，用户也可以定制自己的报告格式。


报告 - 概述

Trimble Geomatics Office所生成的报告都是超文本(HTML)格式，并通过安装在用户计算机上的HTML 浏览器进行显示。 通常，缺省的HTML 浏览器是网络浏览器。

所有生成的报告都放在Trimble Geomatics Office\Projects目录下的报告文件下。报告文件夹下的报告文件按类型组织。除了导入报告 和网平差报告，当新报告生成后，将覆盖报告文件夹中已经存在的同名报告文件。

可以生成两类报告文件：

  系统报告

  数据库报告

常用的报告可通过Reports 菜单访问。某些报告文件能否得到依赖于用户是否安装了相应的模块（基线处理模块和网平差模块）和是否已经生成了所要的报告文件。

注： Trimble Geomatics Office 报告文件不支持在 Microsoft Internet Explorer version 2.0 或 3.0 下浏览。如果用户有这样的版本，Trimble 推荐用户通过网络安装 Microsoft Internet Explorer 4.0 或 5.0。


Microsoft Internet Explorer 网络浏览器 - 报告概述

如果用户没有安装HTML浏览器，Microsoft Internet Explorer网络浏览器可以脱网得到。Microsoft Internet Explorer网络浏览器让用户查看并打印生成的报告。用户可以利用其它的有用的Microsoft Internet Explorer特性使报告更适用。

报告的常用外观

Trimble Geomatics Office用标准的格式显示。在所有的报告中，其字体、字的大小、颜色和背景都是相同的。用户可以通过自己选择参数来越过这些固定的设置。如果用户希望以一种更易于阅读的格式显示报告文件时就可以自定义参数。

提示: 要改变报告文件的背景，在报告文件夹中将 backgrnd.gif用同名的其它GIF图形文件代替。

用户可以设置打印输出时不打印报告文件的背景。缺省值是不打印背景。

在其它的应用软件中打开

许多的应用软件支持HTML格式的文档。此外，用户可以将报告文件存为文本(*.txt)文件后在其它的诸如文本编辑器、电子表格或word中查看。 用户也可以将选定的报告文件拷贝到剪贴板上再粘贴到其它的应用软件中。

如果用户需要将报告插入到一个文档中，需要编辑报告的内容，需要在其它的应用程序对数据进行进一步的处理，以上这些特性是很有用的。

对于在用户报告中利用Microsoft Internet Explorer 特性，可参见Internet Explorer 帮助。


定义报告格式对话框

用这个对话框来定义报告格式。

要访问它：

1.	选择报告 / 附加报告菜单。

出现附加报告对话框。

2.	按下面的步骤之一执行：

  按新建键定义一种新的报告格式。

  在报告列表中选择一个已经存在的报告，按编辑修改选定的格式。

注： 用户不能编辑测点，高程范围，坐标系统细节，或测点对照报告。

名字

输入报告格式的名字。这个名字显示在常用报告对话框的报告列表中。不允许有重名。

空串

Null显示在文件 /项目属性 / 单位和格式按钮下设置的空串。该项所指定的字符串用在生成常用报告中，它为空值。这一项是可选的。

描述

用户可以在描述项中输入报告格式的描述。这种描述显示在状态条上。这一项是可选的。

缺省的扩展名

在定义报告格式中不用缺省的扩展名。

报告

选择某一主表或查询作为报告的来源。缺省的来源是测点的信息记录。这允许用户从测点列表中报告任何的记录。

自动格式填充

按自动格式填充，自动初始化头部文件和主体文件，需进一步了解可参见自动格式填充。。

格式化头部文件

输入用于组成报告头文件固定的文本和任何野外编码定义(从快捷菜单中得到) 。这一项是可选的，不需要特别的定义。

按 Enter 键在头部文件定义中增加空行。

格式化主体文件

输入适当的野外编码定义 (从快捷菜单中得到) 去显示Trimble Geomatics Office将在本项目中报告什么数据。

例如，下面的格式给出一个固定宽度的测点列表：

[Name:10][First ordinate:14.3][Second ordinate:14.3][Elevation:14.3][Feature code:20]

格式化头文件和格式化主体文件可以左空（不能同时左空）。这让用户自己定义项目的头部信息。

格式化文件页脚

输入用于组成报页脚的固定的文本和任何野外编码定义(从快捷菜单中得到) 。这一项是可选的，不需要特别的定义。例如，用页脚去显示EOF (文件结束命令)。

按 Enter 键在页脚定义中增加空行。

要了解系统中可得到的所有野外编码的进一步的信息，参见野外编码-概述。


重新计算报告 - 概述

重新计算报告是超文本 (HTML)报告，它概述了重新计算处理的结果。用重新计算报告去消除警告标记通过下面方法实现：

  检核测段细节

  检核测点名的正确性

  如果怀疑键入的坐标有误，则不用改坐标

  如果必要重新观测

重新计算报告报告如下内容：

  由多种观测值和坐标导致测点点位超出限差(限差在项目属性对话框的重新计算标签下定义)。

  能被用于确定测点位置的一个以上的观测值或键入的坐标，测点点位在限差之内。

  不用的观测值和误差。

  起点坐标和坐标来源顺序。

  报告中引用的观测值和坐标。

Trimble Geomatics Office在每进行一次重新计算后生成一个重新计算报告。用户如何被告知重新计算报告已经生成依赖于项目属性对话框的报告标签下的视图生成报告域。报告文件通常存放在项目下的报告文件夹下。和其它的系统报告一样，如果报告文件已经存在，新报告将覆盖旧报告。

重新计算报告包括以下几部分内容：

  项目细节

  错误

  警告

  闭合差

  测点来源

  起始点

  导线报告

  测量数据 (观测值和坐标)


重新计算报告 - 项目细节 部分

重新计算报告的项目细节部分概述了项目名和坐标系统细节。


重新计算报告 - 错误和警告部分

重新计算报告的错误和警告部分列出所有不止一套坐标的点和坐标超出限差的点。它们也显示了哪个观测值没有应用，哪些点不能用于计算坐标。

用这几部分去检验错误和警告，并决定是否通过编辑项目去解决问题。要查看测点的来源，点击测点。这将带领用户到测点来源部分。

水平方向和垂直方向的容忍误差同时显示。这些可以通过项目属性对话框-重新计算标签进行设置。


重新计算报告 - 测点来源部分

重新计算报告的测点来源部分显示了测点的计算位置。在重新计算报告只有含误差和闭合差的点位才被报告来源。用于计算点位的水平（北、东）分量的质量、高程分量的质量和椭球高分量的质量都被列出。

在计算的点位和质量之下，是一列可用于整理点位的测量数据。

每个观测值显示的内容有：

  观测值类型

  观测值ID标识

  “起点”和“终点”

要查看观测值细节，点击ID标识。这些链接到重新计算报告的测量数据部分。

要在图解窗口（包括属性窗口）中选择观测值，选择观测值ID标识左边的图标。这一链接让用户非常容易的在测量视图中显示超出闭合差的观测值。

每个坐标显示的内容有：

  坐标的类型 (网格, 地理, 或 点位解)

  坐标的来源

  坐标的ID标识

要查看坐标的细节，点击ID标识。这些链接到重新计算报告的测量数据部分。

再次，要在图解窗口和属性窗口中选择测点，选择观测值ID标识左边的图标。

用于计算的列显示从观测值和坐标中，那些位置分量(NE,e,h)被用于计算。例如，如果某一观测值确定了测点的北方向、东方向和椭球高分量，坐标确定高程分量，用于计算的列在GPS观测值旁显示Neh在坐标旁显示e。

北方向差、东方向差、高程和椭球高差显示最终计算的点位和仅用观测值和坐标计算的点位的差异。

如果差值超出了项目所设定的限值，旗标将出现，数字将变成红色。标记为红色的观测值并非都意味着观测值和键入的坐标不正确�重新计算可能用很差的观测值和键入的坐标。用户应该确定误差的原因并显示所有比较差的观测值。

用报告的测量部分去检验每一个观测值。

提示: 用户可以用属性窗口和报告 / 点来源报告菜单命令去查看项目中的测点来源报告，包括没有在重新计算报告中列出的测点。


重新计算报告 - 导线报告部分

重新计算报告的导线报告部分显示起点的导线重新计算是如何计算的和所用的观测值。

只有在起点部分不止一条之路，导线情况才被报告。这样做是为了避免偏移值也被报告。

例如：如果观测值如下：

  从起点1 � 到测点 2 � 到测点3再回到测点1，将被报告。

  从起点1 � 到测点 2，将不被报告。


重新计算报告 - 闭合差部分

重新计算报告的闭合差部分显示了由多种观测值组成的在项目容忍闭合差之内的测站点的列表。依据测量数据，所有测点的闭合差按北方向的较差、东方向的较差、高程差和椭球高差显示。

在测点上点击以查阅其来源细节。 这些都链接到测点来源部分。


重新计算报告 - 测量数据部分

测量数据部分显示与重新计算报告中列出的测点有关的所有观测值和坐标。测量数据按观测值类型组织。用户用该部分发现那些观测值是不正确的。

该部分列出了重新计算报告中引用的观测值和坐标。

用户可以在属性窗口中查看测量数据。


重新计算报告 - 起始点部分

重新计算报告的起始点部分显示了观测值中开始重新计算的点。


重新计算报告 - 附加坐标系统细节

附加坐标系统细节部分列出了当地测站设置信息。

注： 当地测站设置是通过 项目属性对话框 � 坐标系统标签 进行设置的。


测点来源报告命令

用这一命令查阅选中点的测点来源报告。

要访问它：

1.	选择用户想要浏览的点。

2.	选择报告 / 点来源报告菜单。

测点来源报告在缺省的HTML浏览器中显示。


测点来源报告

测点来源报告是重新计算报告的一部分，它显示测点的计算位置。计算点位的水平（北、东）分量、高程分量和椭球高分量将被显示。

报告的格式和重新计算报告中的测点来源部分一致。

要访问报告：

1.	选择用户想要浏览的点。

2.	按下面的步骤之一操作：

  选择报告/测点来源报告菜单。

  打开属性窗口 /测量标签 / 摘要页，选择测点来源光标 [image] 。

报告将通过 HTML浏览器显示。

注： 要在测量视图中选择测点，在测点或观测值左边的ID标识上点击。这样做对链接回退到测量视图中测点是非常有用的。


反向命令
反向报告命令

用这一命令显示反向计算后通过反向对话框产生的最新的反向报告。

要访问它：

  选择报告 / 反向报告菜单。

报告在缺省的 HTML浏览器中显示。


反向报告

反向报告在反向计算后生成，它显示有关反向的简练的、详细的和混合的信息。

简练的反向报告显示用于定义反向的网格方位角，网格距离和起点、终点的高差。

详细的反向报告显示起点、终点的在网格、当地（地理）和笛卡儿（WGS-84）坐标系下的坐标和反向参数。

用反向对话框 来生成报告。

在报告生成以后，用户可以通过选择报告 / 反向报告菜单随时查阅最新的报告。


重命名点报告

在用重命名点命令对点进行重命名后，重命名点报告让用户显示原始点名和更改后的点名。

通过重命名对话框生成报告。


导入报告

每次当文件导入到项目中时，Trimble Geomatics Office将为每一个导入的文件生成一个导入报告。它被命名为<导入文件名>.html，包括下面几部分的内容：

项目细节

这部分概述可项目名就坐标系统细节。

信息

这部分列出了导入过程中的任何信息，如果在导入过程中没有产生任何信息，这部分将不显示。

重新计算报告

该报告包括一个在导入处理后自动生成的与重新计算报告相关的链接。重新计算报告概述了重新计算处理的结果。

要素码处理报告

如果在导入过程中对要素码进行了处理，该报告将包括一个与要素码报告相关的链接。

注： 如果重新计算报告或要素码处理报告的链接是红的，则说明在报告的处理和显示中包含错误。

一个命名为Import.html 的“已导入的文件”报告在数据导入过程中也可以生成。这一报告列出了所有导入到项目中的文件。在其它时段导入到该项目的文件将自动被追加到该报告中。

在项目属性对话框 � 报告按钮的浏览生成报告选项中设置了将这些报告通报给用户的方式。


附加报告命令

用这一命令去生成Trimble Geomatics Office 提供的系统数据库和常用报告。

要访问它，选择报告 / 附加报告菜单。出现附加报告对话框。


附加报告对话框

用附加报告对话框去生成由Trimble Geomatics Office提供的系统数据库和常用报告。要访问对话框，选择报告/附加报告菜单。

系统数据库报告

系统数据库报告是预先定义的报告格式，它提供当前项目的概况。尽管用户不能编辑报告，但用户可以编辑报告格式。要这样做，编辑程序文件\Trimble\Trimble Geomatics Office\系统文件夹下的Asciirpt.dat文件。

常用报告

按照用户的规范要求，常用报告利用数据库中定义的主记录类型和查询。

用户可以生成、定义或编辑一种常用的报告格式。用户也可以通过编辑 程序文件\Trimble\Trimble Geomatics Office\系统文件夹下的Asciirpt.dat文件 来阻止报告格式被修改。

如果用户希望运行的报告文件后跟的是省略号，那么用户需要事先输入某一信息。例如，当用户选择运行高程报告，Trimble Geomatics Office询问用户键入最小和最大的高程。

报告

要报告选择的实体或记录类型，有两种选择：

选中	用该项报告选中的实体或记录类型
整个数据库	用该项报告所有的实体或记录类型
如果没有选中任何东西，这些键不起作用，所有的实体或记录类型将被报告。

注： 当选择了坐标系统详细报告后，该项是不可选的。

数据分类

用户可以选择报告中数据的顺序。

按下面的操作进行：

1.	选择数据分类检查框。

2.	在列表中选择分类顺序。用户可选的数据分类顺序有：

数据库顺序	高程
名字	质量
开始时间	数据
占有时间段

注： 相同的分类选项可以在属性窗口中得到。

提示:如果用户生成了自己的分类查询，它们也将显示在列表中。

报告

报告组列出了系统数据库可常用报告。Trimble Geomatics Office已经定义了多种报告类型。

OK

生成报告并通过缺省的 HTML浏览器显示。

新建

生成并定义一种新的报告格式。

编辑

修改已经存在的报告格式。

删除

删除报告，用户将被要求对该操作进行确认。

注： 用户输入的离散值将被解译为数据库坐标单位而不是当前显示单位。数据库单位依据第一个数据存储到数据库时的显示单位而定。

提示： 用户可以通过用文本编辑器编辑 程序文件\Trimble\Trimble Geomatics Office\系统文件夹下的Asciirpt.dat 文件来修改这些报告。


    GPS测站校准报告命令

在完成校准计算之后，用这一命令显示由GPS测站校准对话框生成的最新的GPS测站校准报告。

要访问它，选择报告 / GPS测站校准报告菜单。

报告在Microsoft Internet Explorer网络浏览器中显示。

注： 此命令在测量视图下是不能得到的。要在测量视图下生成报告，在GPS测站校准对话框中选择报告项。


GPS测站校准报告

GPS测站校准报告在校准计算后生成，它给出所有计算过的参数和一系列的计算点位和其已知点位的比较，并给出了残差值。

用GPS站校准对话框来生成报告。


坐标转换报告命令

在完成坐标转换计算之后，用这一命令显示由坐标转换对话框生成的最新的坐标转换报告。

要访问它，选择报告 / 坐标转换报告菜单。

报告在Microsoft Internet Explorer网络浏览器中显示。

注： 此命令在测量视图的缺省状态下是不能得到的。要在测量视图下生成报告，在坐标转换对话框中选中生成坐标转换报告检查框。


坐标转换报告

坐标转换报告在坐标转换计算后生成，它显示原始坐标和转换后的坐标值。

用坐标转换对话框生成报告。

在报告生成以后，用户可以随时通过选择报告 / 坐标转换报告菜单查看最新的报告。


高程平差报告命令

在完成平差过程之后，用这一命令显示由高程平差对话框生成的最新的高程平差报告。

要访问它，选择报告 / 高程平差报告菜单。

报告在Microsoft Internet Explorer网络浏览器中显示。

注： 此命令在测量视图的缺省状态下是不能得到的。要在测量视图下生成报告，在高程平差对话框中选中生成高程平差报告检查框。


高程平差报告

在高程平差出来完成之后，将生成高程平差报告，用于显示原始坐标和平差坐标值。

用高程平差对话框来生成报告。

在报告生成以后，用户可以随时通过选择报告 / 高程平差报告菜单查看最新的报告。


要素码处理报告

要素码处理报告随着要素码的处理操作而生成。

通过在项目属性对话框的普通标签中设置显示生成的报告选项，在报告生成后，用户可以收到提示。

报告摘要显示处理操作，包括所用的特征和属性库文件(.fcl)的细节和要素码处理过程中可能遇到的任何问题。


项目粘贴报告

项目粘贴报告在测点已经拷贝并粘贴到一个项目后生成。

通过在项目属性对话框的普通标签中设置显示生成的报告选项，在报告生成后，用户可以得到提示。

对于因在两项目中定义不一致而没有粘贴的拷贝点，报告将摘要显示其要素和属性。


水准报告命令

通过这一命令去显示选定文件的水准报告。

要访问它：

选择报告 / 水准报告菜单。

选择水准文件。

该水准文件的水准报告将显示在缺省的HTML浏览器中。


水准报告

水准报告显示了用户水准文件中的水准观测值和水准数据。

要访问报告：

1.	选择报告 / 水准报告菜单。

2.	选择水准文件。

该报告在HTML浏览器中显示。它显示如下信息：

水准数据

这部分将以水准外业手簿格式显示水准测量值。包括后视，中视，前视观测值和计算的高差信息将显示在数字水准导入对话框中。

水准观测值

水准观测值表显示了下列信息：

  ID

  起点

  终点

  质量

  Δ

高程 � 这些值在测站点之间计算。

提示: 要在图形窗口中选择水准观测值，请选择观测值的ID标识。这一链接让用户很容易的在属性窗口中查看水准观测值。

注：水准报告将保存在<Project name>\报告\水准目录中。


所有命令
i所有命令

使用该命令在当前项目中选择所有实体。

要访问它，选择 选择/所有。

测量视图

如果你在测量视图工作，所有的可见实体都被选择。

例如，如果使用视图/ 过滤器命令隐藏一些观察值，再使用选择 / 所有命令，则不选择隐藏的观察值。

计划视图

如果你在计划视图工作，在如下图层所有的实体都被选择：

 可见的属性设置成开

 锁定的属性设置成关。

例如，如果使用图层选择工具打开图层中被锁定的的属性，再使用选择/所有命令，在被锁定图层的所有实体将不被选择。

提示：状态栏显示被选择实体数信息。


没有命令

使用该命令清除选项。

要访问它，选择 选择/没有。

提示：状态栏显示信息表明选项为空。


点命令

使用该命令打开选择点对话框

要访问它，选择 选择/点。


选择点对话框

概述	如何作 ...

使用该对话框选择用标准指定的点。可使用通配符 和范围值。你也能在多个标签里输入标准。Trimble Geomatics Office软件仅选择满足所有标准的点。

要访问它，择 选择/点。

如果你使用测量视图访问此对话框，Trimble Geomatics Office软件仅仅考虑当前可见的点。这意味着如果使用视图过滤器对话框 来过滤观测值，这些点将不被选择。当使用测量视图时，图层信息(在计划视图中可用)在选项标准中被忽略。

如果你使用计划视图存取对话框， Trimble Geomatics Office软件仅仅考虑当前可见的并且没被锁的点。当使用计划视图时，在测量视图中任何被使用的视图过滤器都被忽略。

标签是：

 普通的

 GPS

 观测值

添加到当前选项

当你访问该对话框时，如果选择了一个或多个实体，此项变为可用。如果要在使用该对话框的选项前清除当前选项，可清除此项。


选择点对话框 - 普通标签

在普通点域使用该标签输入标准。

名称匹配和要素码匹配

使用这些域来根据名称（和要素码）来进行选择。可输入用逗号分隔的名称。例如，如果项目中存在，'100,250,1020'可选择这些名称。省略号(...)或破折号(--)在范围以内选择带有指定名称的各点。

在包括数字字母名称的一个范围内，由于使用完全的字母分类，将选择一些不需要选择的实体。

注：如果开始和结束范围的名称是数字的，则选择一个数字范围。

在这些域内可以使用通配符。

注：包含连字符的名称，在连字符上加引号。例如，名称为'a-2'的点输入为'a-2'。否则，Trimble Geomatics Office软件从a到2排序。

使用双引号防止包含通配符的名称的句式匹配。例如，“ URS#1 ”...“ URS#8 ”防止在选项范围内将#作为一个通配符使用，并且在 URS#1和URS#8 之间选择具有清楚名称的点。

名称不区分大小写。

点质量

从列表中选择标准内定位值分量的质量。可选择多重的点质量。

来源

从列表中选择点来源。可选择多个来源。选择测量数据至少来自一个所选来源的点。

要素码

输入要用来选择点的要素码。

图层

当你从测量视图中访问此对话框时，该选项是无效。

使用列表选择标准中的图层。可选择多重的图层。被选图层中的所有点将被选择。

点样式

从列表中选择标准的点 CAD 样式。可选择多重的点样式。具有此点样式的所有的点(在属性窗口- CAD标签 中指定)被选择。

添加到当前选项

访问此对话框时，如果选择了一个或多个实体，此项变为可用。如果想要在使用该对话框的选项前清除当前选项，清除此项。


选择点对话框- GPS 标签

使用该标签用 GPS数据输入选项标准。标准适用于事后处理和RTK GPS 基线。

如果一个点有至少一条基线满足标准，该点被选择。

平面精度，垂直精度

按小于，等于，或大于等于按钮来选择标准的符号。

使用键盘输入精度值。

如果你留下一个域为问号(?)，在选项标准中不使用该域。

解类型

在你的标准中使用解类型，从列表中进行选择。可选择多重的解类型。具有 GPS 观察值（具有所选解类型）的任何点都将被选择。

域方法

从列表中选择标准中要使用的域方法。你能选择多重的域方法。

注：只选择解类型和域方法都满足的点。

添加到当前选项

当你访问此对话框时，如果选择一个或多个实体，此项变为可用。如果要在使用该对话框的选项前清除当前选项，清除该项。


选择点对话框-观测标签

使用这个标签输入用观测值详细信息确定的选项标准。选择至少有一个观测值满足标准的所有点。

所有基准站和仪器安置

使用此框选择所有GPS基准站的点和地面设置的点。

天线或目标高度

使用这些域在标准中输入天线高或目标高的范围。在第一个域输入的值必须小于第二个域中输入的值。输入的值是包含性的。

观测时间

选择此框输入一个日期和时间范围，用于标准中。在此范围内具有开始和结束时间的点被选择。如果以前在这个域中输入了值，在下次使用该选项时将被保留。

从点观测

输入观测起点的点名。该点可以是一个 GPS基准站，也可以是一个地面设置的点。

在图形窗口中使用域填充选择一个点。

添加到当前选项

当你访问此对话框时，如果选择一个或多个实体，此项变为可用。如果要在使用该对话框的选项前清除当前选项，清除该项。


选择实体- 使用通配符

概述和更多信息

当使用选择/点对话框 来选择点，或使用选择/观测值对话框 来选择观测值时，在一些域能使用通配符来选择一个范围的值。

你能使用下列通配符：

也可使用多重的通配符。例如,，1 ? 0*0 匹配 1500 , 1A0250 , 15020 。下表说明如何使用各种类型的匹配来测试句式。

点名 ‘10'假设在 '1'和'a' 之间。它将不在 '1'和'9'的范围内， 因为两个名称都是数字的。


 观测命令

使用该命令打开选择观测值对话框。

要访问它，选择选择/观测值 。


 选择观测值 对话框

概述	如何作 ...

要访问它，选择 选择/观测值 。

使用此对话框，用指定的标准选择观测值。可使用通配符 和范围。也可在多个标签中输入标准。Trimble Geomatics Office软件只选择满足所有标准的观测值。

标签是：

 普通的

 GPS

添加到当前选项

当你访问此对话框时，如果选择一个或多个实体，此项变为可用。如果要在使用该对话框的选项前清除当前选项，清除该项。


  选择观测值 对话框-普通标签

使用这个标签输入选择观测值的一般标准。

起始点匹配，到达点匹配

输入用逗号分隔的名称。省略号(...)或破折号(-)选择在省略范围内具有指定名称的各条基线。在包括数字字母名称的范围内，由于使用完全的字母分类，将选择一些不需要选择的实体。

注：如果开始和结束范围名称是数字的，则选择一个数字范围。

可使用通配符 。

斜距

使用这区域在标准中输入一个斜距范围。你在第一个域输入的值必须小于第二个域输入的值。输入的值是包含性的。

如果在指定的范围内具有带平面距离的简化观察值，该观测值也被选择。

类型

从列表中选择观测值类型。例如，可选择RTK，激光或方位角观测值。

来源

从列表中选择观测值来源。可选择多重的来源。将选择至少有一个观测值来源的所有观测值。

状态

从列表中选择标准的观测值状态。

观测值ID

输入观测值ID，或一系列观测值ID来选择观测值。例如，选择GPS基线8，输入B8。输入B8-B12在该范围内选择所有基线。

只照准

当选择该框时，只选择照准点。

添加到当前选项

当你访问此对话框时，如果选择一个或多个实体，此项变为可用。如果要在使用该对话框的选项前清除当前选项，清除该项。


 选择观测值对话框- GPS 标签

使用该标签输入用于选择 GPS 基线的标准。

比率

选择小于或大于符号。输入想要在标准中使用的比率值。

参考方差

选择小于或大于符号。输入想要在标准中使用的参考方差。

RMS

选择小于或大于符号。输入想要在标准中使用的 RMS值。

平面精度

按小于等于或大于等于按钮选择标准的符号。输入想要在标准中使用的平面精度值。

垂直精度值

按小于等于或大于等于按钮选择标准的符号。输入想要在标准中使用的垂直精度值。

注：  平面精度值和垂直精度值基于准确值。显示的值，如在属性窗口的域，都使用加圈的数字。

解类型

从列表中选择想要在标准中使用的解类型。可选择多重的解类型。

域方法

从列表中选择想要在标准中使用的 GPS域方法。可选择多重的域方法。

注：只选择解类型和域方法都满足的观测值。

观测

在这些区域，可指定一个用于标准的日期和时间范围。在指定的标准中，具有开始和结束时间的观测值被选择。如果你以前在这个域中输入了一个值，在下次你使用该选项时将被保留。

长于（秒）的观测

使用该域来选择超过指定观测时间的GPS基线。域的格式为  hh:mm:ss。

注：可填充该域来指定时间。

添加到当前选项

当你访问此对话框时，如果选择一个或多个实体，此项变为可用。如果要在使用该对话框的选项前清除当前选项，清除该项。


 图层命令

使用此命令在指定的图层中选择所有的实体。

要访问它，选择选择/根据图层。

出现根据图层选择 对话框。


 根据图层选择 对话框

使用此对话框在被选图层中选择实体。

要访问它，选择 选择/根据图层。

图层

图层列表显示项目中图层的名称。

选择出现在图层中的实体，选择图层名称旁边的选项框。

如果图层的锁定属性设置成开，或可见属性设置成关，图层框出现阴影。要输入所选图层，使用图层选项工具 或图层对话框 来改变锁定属性和可见属性。图层框变为可用。

所有

按所有来选择在图层列表中显示的每个图层。

没有

按没有来清除图层列表中所有的图层框。


 样式命令

使用这个命令来选择使用指定样式的所有的实体。

要访问它，选择选择/根据样式。

打开根据样式选择 对话框。


 根据样式选择 对话框

使用此对话框来选择指定了样式的计划视图中的所有 CAD 实体(点，直线，弧，曲线，注释，文本)。

要访问它，选择 选择/根据样式。

样式

选择一种特别的样式类型的标签。与用于CAD样式对话框 的样式相同。从出现的列表中选择一种样式。只能使用一个标签来选择实体。如你从一个标签中选择一个或多个样式，那么选择另外的标签，你在前面标签中所做的任何选项都将丢失。

要选择多重实体类型(例如，点和直线)，使用此对话框来进行选择，保存在选项组 中，然后选择另外的实体类型。保存新的选项组。利用选择/选项组/恢复 能同时恢复两个选项组。

使用< By Layer >选项来选择相应域被设置为< By Layer >的实体。

所有

按所有来选择在样式列表中显示的各种样式

没有

按没有来清除样式列表中的所有样式框。


 类型命令

使用此命令来选择具有指定类型的所有实体。

要访问它，选择 选择/根据类型。

打开根据类型选择 对话框。


 根据类型选择 对话框

使用此对话框来选择具有指定类型的实体。

要访问它，选择 选择/根据类型。

类型

类型列表显示所有不同类型实体的名称(点，直线，曲线，弧，注释，文本)。

选择特定类型的框来选择该类型的实体。

所有

按所有来选择在类型列表框中显示的各种类型。

没有

按没有来清除在类型列表框中显示的各种类型的框。


询问命令

使用此命令选择在询问中指定的实体匹配条件。

要访问它,选择选择/通过询问。

出现根据询问选择对话框 。


根据询问选择 对话框

概述和更多信息

使用此对话框来选择用于选择实体的询问。

要访问它，选择 选择/询问。

询问

可用的询问列表包括在项目中或在下列情况中定义的任何自定义询问项 ：

询问项根据询问定义选择实体，对询问的描述显示在状态栏上。

例如，可选择特定范围的高程点。

在询问需要参数的地方，名字后跟一个省略号。如果选择这样的询问，则需要提供参数值。

选项

在选项组中有三个选项：

 新选项-产生一个新选项

 添加到当前-添加到当前选项

 改进当前-改进当前选项


根据点要素 命令

使用此命令来选择的点，其要素码带有与指定名称匹配的属性。

要访问它，选择 选择/根据点要素。

出现根据点要素选择对话框 。


根据点要素选择 对话框

使用此对话框来选择采集了要素和属性信息的点。使用属性窗口-属性标签 ，浏览点的要素和属性。

要素

要素列表显示带有用于建立属性 项目的要素和属性库文件(*.fcl) 或数据库文件(*.ddf) 中的属性定义的所有要素。

选择要素框。选择至少指定一个要素的点。

所有

要选择所有的框，按所有。

没有

要清除所有的框，按没有。


选项组-概述

更多信息

如何作 ...

概述

选项组是当前在 Trimble Geomatics Office软件中选择的任何内容。可在任何时间保存当前选项组，或在以后重新找到它。例如，可记录项目中所有控制点的选项组，并通过重新找到它们来定期提出报告。这些被保存的选项组保持他们的实体顺序。如果你删除作为选项组一部分的实体，选项组仍以保留的实体而有效。

当导入一个文件时，Trimble Geomatics Office软件自动生产一个被命名的选项组。选项组记录采集数据的顺序。这对如要码编码等任务是非常重要的。对于测量控制(*.dc)文件, Trimble Geomatics Office软件将新选项组以导入的任务标识符命名。对于其它文件，例如 ASCII 文件，Trimble Geomatics Office软件将新选项组以文件名命名。

注：如果导入的RTK数据在15分钟初始化时有初始值损失发生，在导入时将创建一个高RMS值的选项组。


选项组-保存命令

使用此命令来保存当前选项组。

要访问它，选择 选择/选项组/保存。

出现保存对话框 。

如果当前没有任何选项，该命令不可用。


选项组-保存对话框

概述和更多信息

使用此对话框保存当前选项组。

要访问它，选择 选择/选项组/保存。

名称

输入选项组的唯一名称。

确定

单击确定产生选项组。

下次打开它时，选项组出现在恢复对话框中。新的选项组被添加到最近被使用的选项组列表中。要打开恢复对话框，并浏览最近使用的选项组，选择选择/选项组 。


选项组-恢复命令

使用此命令恢复选项组。如果没有要恢复的选项组，该命令不可用。

要访问它，选择 选择/选项组/恢复检索。

出现选项组-恢复对话框 。


选项组-恢复对话框

概述和更多信息

使用此对话框立即恢复一个或多个选项组。例如，如果保存了两个选项组，使用此对话框选择这两个选项组中的所有实体。

要访问它，选择 选择/选项组/恢复。

选项组

此列表包含项目中保存的所有选项组。

所有

单击所有选择各选项组。

没有

单击没有清除所有选项组的框。


选项组-编辑命令

使用此命令编辑所保存选项组的详细信息。如果没有要编辑的选项组，这个命令不可用。

要访问它，选择 选择/选项组/编辑。

出现编辑对话框 。


选项组- 编辑对话框

概述和更多信息

使用此对话框重命名或删除所保存的选项组。

选项组

突出显示需要编辑或删除的选项组。

重命名

单击重命名重命名突出显示的选项组。

删除

单击删除删除突出显示的选项组。


选项组- 重命名对话框

概述和更多信息

使用此对话框重命名突出显示的选项组。

要访问它：

1 .选择选择/选项组/编辑。

编辑对话框出现。

2 .单击重命名。

重命名对话框出现。

名称

输入选项组的唯一名称。

确定

单击确定应用所做改变。

选项组出现在编辑对话框中。新的选项组出现在最近使用的选项组列表中。


选择实体-概述

有时只想在项目的一个子集上进行操作(例如，处理要素码)。在项目中可用两种方法选择实体(点，直线，弧，曲线，文字，注释，观测值)：

 使用鼠标。

 使用选择菜单。

使用鼠标选择实体

选择一个实体, 使用鼠标单击它。（选择多个实体，同时按下Shift键）

然后在所选实体上执行所需任务。

要进行相反选择,按Ctrl键。任何当前被选择的实体都被取消选择，反过来也如此。

注： 可使用鼠标浏览属性窗口中的实体，而不必重新选择。按鼠标，并将其放在一个点上持续几秒钟，然后将指针拖到想要浏览的实体上。

使用选择菜单选择实体

选择菜单包括许多不同的选择点的方法。在选择菜单中的选项取决于你是在测量视图 还是在计划视图中。


重复点- 坐标命令

使用此命令选择具有相同坐标的点。

要访问它，选择 选择/重复点/坐标。


重复点- 名称命令

使用此命令选择有重复名称的点。

要访问它，选择选择/重复点/名称。

提示 ：在合并重复点 前使用此命令。


重复点-名称和距离命令

使用此命令选择有重复名称并且在指定的距离以内的点。在参数输入对话框 中输入值。

要访问它，选择 选择/重复点 /名称和距离。


Select Staked Points dialog
选择放样点 对话框

使用此对话框选择用于一系列询问的放样点。这些选项工具能与附加报告一起使用 。

要访问它，选择 选择/放样点。

询问

可用的询问列表包括项目中或下列情况中定义的任何自定义询问项:

的地方，名称后跟一个省略号。如果选择这样的询问，则需要提供参数值。

选项

在选项组中有三个选项：

 新选项-产生一个新选项

 添加到当前-添加到当前选项

 改进当前-改进当前选项


Select Calibration Points
选择校准点

使用此选项在Trimble Geomatics Office软件中选择出现在GPS校准-点列表 中的校准点。

要访问它，选择 选择/校准点。

项目中出现在GPS校准-点列表的所有校准点被选择。

注：如果校准点列表中没有点，该选项不可用。


技术支持

如有疑问，或在产品说明书中找不到相关信息，请与当地经销商联系。或者通过Trimble 互联网址(http://www.trimble.com/support/support.htm) 寻求技术支持。


工具栏 - 概述

工具栏由一个或多个工具组成。工具栏在Trimble Geomatics Office 图形窗口中以垂直线段相互分离。工具是经常使用的菜单命令的快捷键。

为了查看到工具的描述,将鼠标指针移动到工具上并可查看到：

  工具指南

  状态栏

如要要改变在 Trimble Geomatics Office 窗口上工具栏的位置，可拖住工具栏的垂直线并将其移动到其它位置上。

在测量视图和计划视图中可使用以下工具栏：

  标准

  视图

  视图控制

以下的工具栏只在测量视图中有效：

  过滤器

  时间线 (如果安装了基线处理模块)

  时间线绘图 (如果安装了基线处理模块)

  椭圆控制(如果安装了网平差模块)

以下工具栏只在计划视图中有效:

  图层

  CAD


CAD 工具栏

CAD 工具栏提供了快速访问插入菜单的公用要素的能力。

此工具 �	打开此对话框�	此操作可向数据库中增加�
	插入点	点记录
	用方位和距离插入点	点记录
	插入线工作	直线记录
	插入线工作	曲线记录
	插入线工作	弧线记录
	插入文本	文本记录


标准工具栏

标准工具栏提供了快速访问在文件菜单和编辑菜单中主要选项的能力。

工具	操作 �
	创建新项目
	打开已存在的项目
	从文件、设备或GPS接收机导入数据
	将数据导出到文件、设备或GPS接收机中
	将所选项剪切并放到剪贴板上
	复制所选项并放置到剪贴板上
	粘贴剪贴板上的内容
	撤消上一操作
	重复上一未执行的操作
	打开属性窗口,浏览或编辑当前所选项的属性.


图层编辑工具

选择 [image] 显示图层对话框。此对话框用于管理图层。


    图层选择工具

显示的图层是当前图层改变当前图层，点击箭头，从下拉列表中选择图层。

灯泡图标表示图层是否可见。要改变图层的可视性，请点击恰当图层的灯泡图标。如果一个或多个图层可视属性为关闭状态，则在状态栏上会显示灯泡图标。

挂锁图标表示图层是否锁定。如果锁定属性为开状态，则不能选择图层中的任何实体,尽管可在图形窗口中看到这些图层。

改变图层的锁定状态，点击合适图层的挂锁图标。再点击挂锁图标使图层可选。如果多个图层是锁定状态，则会在状态栏上显示挂锁图标。

注: 也可以用图层对话框改变这些属性。


视图控制工具栏

 视图控制工具栏提供的导航工具，可协助在主图形窗口内进行浏览。

以下按钮是在选中 模式下操作的。选中 模式是指当选则了某工具后光标保持，直到点中其它不同的工具：

工具	选择后 �
	改变选择的模式
	移动到放大区域的中央
	用2倍的比例放大
	以2倍的比率缩小

以下工具是非点中的。每次选择这些条目则执行：

工具	选择后 �
	缩放到原来的大小
	缩放到前一设置
	项目栏关闭或打开
	在图形窗口中显示格网线. (也可以在视图选项对话框 中选择这些设置.)


视图工具栏

使用视图工具栏中的工具完成以下操作：

此工具�	切换视图到�
	测量
	计划


    过滤器工具栏

在测量视图中可看到 过滤器工具栏。它包含视图过滤器和时间线工具。

工具	选择后�
	确定要显示的观测值，或者如何在测量视图中显示。
	打开时间线窗口
	连接图形窗口中的观测值和时间线。当选择此工具时，在当前时间线视图中，软件只显示在同一时间观测的后处理基线。测量视图中所有其它后处理基线将被隐藏。 这是一个很有用的选择独立基线的工具。


    图层工具栏

在计划视图中可以看到图层工具栏。它包含图层编辑工具 和图层选择工具。此工具栏用于管理图层。


    处理要素码命令

使用此命令处理要素码。

访问它，选择工具/处理要素码。

要素码对话框出现。


     处理要素码对话框

 概述

使用这种对话框处理要素码。

访问它，选择工具/处理要素码。

要素和属性库

选择处理数据所需的要素和属性库。

浏览

单击浏览，定位要素和属性库。

注： 在 Trimble Geomatics Office中，所有的要素和属性库是 .fcl 文件类型。如果从一个TRIMMAP系统或一 SDRmap 系统中选择一个要素和属性库， Trimble Geomatics Office自动地将要素和属性库转换为 .fcl 文件类型。

例如， 如果选择一 'Fclib??.dat'  文件(它是TRIMMAP 系统或 SDRmap 系统的要素码库文件名模式)，当你处理此库时, Trimble Geomatics Office将询问是否转换库。系统也要求一个名称以保存库。缺省的名称遵循 Fclib??.fcl 模式，它存储在缺省的系统文件夹中。

如果Trimble Geomatics Office遇到它不能转换的任何代码定义，它将警告结果库需要编辑。如果发生任何错误，系统将产生一份报告。

处理

以所选顺序处理要素码。

选择当前的所选的选项处理当前选择的实体。

选择选择集选项并从列表中选择处理的选择集。

如果没有选择集可得到，当前的选择选项是无效的。

确认

单击“确认”处理要素码。

库被处理，要素码的结果在图形窗口中显示。如果任何错误在处理期间发生，你能看到一份错误报告。若要找到错误在哪儿发生,察看报告。报告存在项目报告文件夹中以便以后的察看.


Trimble RoadLink - 概述

The Trimble RoadLink� 是一个 Trimble Geomatics Office 应用程序。它是第三方道路定义之间的一个强大的界面。

使用它可以：

  输入数据

  以图形方式察看数据

  编辑数据

你可以将道路定义转换到 Trimble Survey Controller 以便在放样期间使用它。

The Trimble RoadLink 提供两种方法转换道路定义：

  自动地转换由第三方设计软件提供的文件（水平和垂直定线以及截面）。

  手工输入完全的道路定义，包括水平和垂直定线、模板和超高。

作为 Trimble Geomatics Office的一个不可分的部分，Trimble RoadLink也能在道路定义和Trimble DTMLink程序中定义的表面模型之间计算土石方。


Trimble DTMLink - 概述

Trimble DTMLink是Trimble Geomatics Office的一个应用程序。此应用程序产生数字的地形表面。使用此软件可导入由第三方软件定义的表面、生成新的表面并编辑以前生成的表面。也可把这些表面模型传输到 Trimble 测量设备，以便在野外设置。

软件在轮廓表面模型中有包括边界和断线的能力，并且允许在模型形成上编辑高等级三角形要素提供更多的控制。

由轮廓表面模型产生的格网或三角形数字地面模型可以输出到一个设备或一个数据文件。

生成的模型也能被Trimble RoadLink用来计算土石方。

Trimble DTMLink可以生成体积报告。

典型的体积计算的应用程序是：

  库存计算

  层材料的的体积，例如煤层

  空的体积，例如在建议修建的水坝后面的湖

DTMLink使用计算单个的三角形的棱柱的体积的方法计算体积。体积由三角形面形成的轮廓表面模型利用底面积乘以柱体的平均高度。

DTMLink可以生成比较表面。比较表面是两表面之间的差别生成的轮廓模型。使用这表面联合体积计算类型“超高”计算两表面之间切割和填充的体积。


    开始命令

此命令开始使用 Trimble DTMLink程序。

访问它，选择工具/ DTMLink /开始。

使用此命令启动 DTMLink 导入一个三维 AutoCAD DXF文件的界面，没有产生新界面或打开存在界面。

进行此操作需要：

1.	选择工具/ DTMLink /开始。

2.	选择文件/导入。

更多的信息，请参见 Trimble  DTMLink 软件的在线帮助。


    新表面命令

使用此命令生成一个新表面模型。

访问它，选择工具/ DTMLink /新表面。

新表面对话框出现。


     新表面对话框

使用此对话框生成一个新表面模型。

访问它，选择工具/ DTMLink /新表面。

名称

输入新表面的一个适当的名称。

点

点选项让你选择项目数据库中从哪个点开始用于表面的生成。

  如果没有当前的数据库可选择，当前的选择选项无效。

  有当前的选择时，当前的选择选项使用当前选择的点来生成表面。

整个的数据库选项使用全部数据库点用于表面的生成。

选择集选项可以选择存在的选择集，它包含有用于生成表面的点。

使用断线

当生成表面时，使用断线选项可以从作为断线的数据库中选择工作线。

在表面模型生成期间，断线是有恒定的等级的线，并且有助于控制模型的生成。

如果选择了使用断线选项，这些选项才是可用的。对于表面生成操作，必须选择使用断线选项才能使任何断线信息通过。

在表面生成过程中，选择集选项可以通过已经存在的选择集使用工作线作为断线；层选项可以通过已经存在的层使用工作线作为断线。在两种情况中，联合的对话框提供可得到的选择集或层的列表。

使用未包括的边界

使用未包括的边界选项在操作上与前面讨论的使用断线选项是一致的。这些选项能够在选择的设置或层定义存在的工作线，它可以在表面模型生成期间用来定义一个或多个未包括的边界。

未包括的边界是在定义的闭合轮廓内未形成三角形的一系列线。如果工作线指定的未包括的边界没有形成完全闭合的图形，则表面模型形成操作将添加缺省的闭合线。

使用包括的边界

使用包括的边界选项在操作上与前面讨论的使用未包括的边界选项是一致的。这些选项能够在选择的设置或层定义存在的工作线，它可以在表面模型生成期间用来定义一个或多个未包括的边界。

包括的边界是在定义的闭合轮廓内形成三角形的一系列线。在任何定义的包括的边界外没有三角形形成。如果工作线指定的包括的边界没有形成完全闭合的图形，则表面模型形成操作将添加缺省的闭合线。

注：断线，未包括的边界和包括的边界使用的工作线包括弧和曲线。在这些情况下，DTMLink 将弧或曲线译为一系列短直线段以用来生成三角形。软件保证由弧或曲线获得的线段没有超过2厘米。

获得边界和断线的更多的信息，请参见 Trimble DTMLink在线帮助。


    已有表面命令

使用此命令编辑已有表面模型。

访问它，选择工具/ DTMLink /已有表面。

已有表面对话框出现。


    已有表面对话框

使用此对话框可以编辑已有的表面模型。此对话框可以定义所需加入已有表面的项目中的点和工作线。

访问它，选择工具/ DTMLink /已有表面。

注：如果在此对话框中定义的点和工作线已经在已有的表面中，系统将识别他们并且不会再次将他们加入已有表面。

名称

此范围列出项目中已有的表面。选择出需装载并且编辑的表面。

添加点

从项目数据库选择需要加入到已有表面的点。

如果没有选择当前的数据库，当前选择的选项无效。

当有当前的选择时，当前的选择选项将在当前的选择中添加点已有的表面。

整个数据库选项传递当前在数据库的所有点到表面模型。这自动地将数据库的任何新点加入到模型。

选择集选项可以选择一个已存在的包含想要添加到已有的表面的点的选择集。

添加断线

添加断线选项可以从数据库选择需要加入到已有表面的断线的工作线。这些选项只有当选择了添加断线选项才可用。

只有选择了添加断线选项，任何断线信息才能加入到已有表面。在表面模型生成期间，断线是有恒定的等级的线，并且有助于控制模型的生成。

选择集选项可以从一个已存在的选择集添加工作线到已有表面作为断线。

图层选项可以在一个已存在的图层将工作线作为断线添加到已有表面。

在两种情况中，对话框提供可得到的选择集或图层的列表。

添加未包括边界

添加未包括的边界选项在操作上与前面讨论的添加断线选项是一致的。

这些选项能够在选择的设置或图定义存在的工作线，它可以作为未包括的边界线添加到已有表面定义的未包括边界。

未包括的边界是在定义的闭合轮廓内未能形成三角形的一系列线。

如果工作线指定的未包括的边界没有形成完全闭合的图形，则表面模型形成操作将添加缺省的闭合线。

添加包括的边界

添加包括的边界选项在操作上与前面讨论的添加未包括的边界选项是一致的。

这些选项能够在选择的设置或层定义存在的工作线，它可以作为包括的边界线添加到已有表面定义的包括的边界。

包括的边界是在定义的闭合轮廓内形成三角形的一系列线。在任何定义的包括的边界外没有三角形形成。

如果工作线指定的包括的边界没有形成完全闭合的图形，则表面模型形成操作将添加缺省的闭合线。

注：断线，未包括的边界和包括的边界使用的工作线包括弧和曲线。在这些情况下，DTMLink将弧或曲线译为一系列短直线段，用来生成三角形。软件保证由弧或曲线获得的线段没有超过2厘米。

要获得边界和断线的更多的信息，请参见Trimble DTMLink在线帮助。


    开始命令

此命令启动 Trimble 的RoadLink程序。通过此软件，可以输入或手工输入道路定义，并上载到Trimble的测量设备来进行放样。

访问它，选择工具/ RoadLink /开始。


    导出命令

使用此命令，可以将选择集，整个数据库，或当前的所选的点导出到Trimble RoadLink。

访问它，选择工具/ RoadLink /导出。

导出对话框出现。


    导出对话框

使用此对话框可以将选择集，整个数据库，或当前所选点导出到Trimble RoadLink。当进入或验证一个道路定义时，显示的 RoadLink中存在的数据库点将有助于导入或验证一个道路定义。

访问它，选择工具/ RoadLink /导出。

点

选择一系列点。

三个选项是可用的：

当前选项	导出所选点
整个数据库	导出整个数据库点
选择集	从列表中选择选择集。

要获得更多的信息，请参见 Trimble DTMLink帮助。


商标

Globe & Triangle标志、Trimble、DTMLink、GPSurvey、RoadLink、Trimble Geomatics Office、Trimble Survey Controller、Trimble Survey Office、Trimble Total Control、TRIMMAP、TRIMNET、TSC1和TSCe都是Trimble Navigation Limited的商标。

带有Trimble、Geodimeter和GPS Pathfinder的Sextant标志是Trimble Navigation Limited在美国专利局和商标事务所登记的商标。

所有其它商标归各注册者所有。

Standard Template Library, � 1994 Hewlett-Packard Company, Standard Template Library, � 1996,97 Silicon Graphics Computer Systems, Inc., Standard Template Library, � 1997 Moscow Center for SPARC Technology.


压缩和修复项目命令

使用这个命令来压缩和修复项目数据库。

访问它：

  选择工具/压缩和修复项目。

压缩和修复项目对话框打开。


压缩和修复项目对话框

使用此对话框来压缩和修复项目数据库。

压缩

压缩节省硬盘空间并且使软件更好地执行功能，定期经常地压缩项目数据库是保持系统运行的好方法。

修复

数据库可能损坏，例如当Trimble Geomatics Office正在运行时，发生电源故障。

如果正在编辑数据库且Trimble Geomatics Office出人意料地关闭，上次对数据的修改可能在修复数据库后丢失。必须再打开项目，回到正在编辑的地方，并且检查保存的修改。

使用压缩和修复项目对话：

1.	选择工具/压缩和修复项目。

2.	选择需要压缩和修复的项目。

如果项目数据库不能被压缩或修复，出现一条错误消息。

提示:如果硬盘存储空间破碎，则压缩数据库前请进行整理。


Trimble Geomatics Office 工具

采用Trimble Geomatics Office的典型安装选项可以得到以下的 Trimble Geomatics Office工具：

Trimble Coordinate System Manager�工具

Trimble Convert to RINEX工具

Trimble Data Transfer工具

Trimble DC File Editor�工具

Trimble Feature and Attribute Editor�工具

Trimble Line Type Editor�工具

规划工具

Trimble Symbol Editor�工具

Trimble A1 阅读器

注释：Trimble Grid Factory�工具可从自定义安装项得到。

为了获得更多信息，参考Trimble Geomatics Office用户指南。

增加工具

将额外工具增加到工具菜单：

1.	使用Microsoft Windows Explorer定位\程序Files\Trimble\Trimble Geomatics Office\工具。

2.	右键点击右边探测器窗口的清晰部分。

3.	选择新建/快捷选项。

打开创造快捷范例。

4.	安装快捷，为需要增加到工具菜单中的工具输入路径。

5.	点击下一个并且完成选择快捷名字区域来定义需要显示在工具菜单中的工具名称。

下次运用 Trimble Geomatics Office时，增加的快捷工具显示在工具菜单中。


符号编辑器

Trimble Symbol Editor™ 工具编辑Trimble Geomatics Office使用的点符号库(*.sym)。

访问此功能，有以下几种方法：

  当没有打开项目时，选择工具/符号编辑器。

  随时从Microsoft Windows开始菜单选择。

此工具用于创建或修改现有的点符号。一旦将编辑文件注册为系统文件，当在 Trimble Geomatics Office或 Trimble Feature and Attribute Editor工具中增加或修改点式样时，所创建的符号即是可用符号。

一种点式样

  定义了一个点如何在Trimble Geomatics Office中被拖拉。

  包括在符号编辑器工具中已创建的符号。

在符号编辑器工具中产生一个符号不自动使符号作为Trimble Geomatics Office中的点式样而可得到。一个点被分配一种点式样,而不是一个符号。一种点式样必须使用最新产生的符号来定义。

符号编辑器用Trimble Geomatics Office使用的当前符号库自动打开。在被打开的库中的符号名称显示在屏幕上的一张表中。使用这张表选择需要编辑的符号。

能运行Trimble Geomatics Office的独立编辑器。从Trimble Geomatics Office文件夹中选择符号编辑器工具的快捷图标。

注释:  当运行Trimble Geomatics Office的独立编辑器时，对当前符号类型所做的任何变化都不反映在任何当前打开的项目中。为了查看这些被使用的变化，关闭并且再打开项目。被保存的变化在符号库中变得可得到。

为了获得更多的信息，参见Trimble Symbol Editor工具的帮助。


线型编辑器

Trimble Line Type Editor™ 工具编辑被Trimble Geomatics Office使用的线型库(*.ltp)。

访问它，有以下几种方法：

  当没有项目打开时，选择工具/线型编辑器。

  随时从Microsoft Windows 的开始菜单选择。

使用这个工具产生或修改现有的线型。一旦登记被编辑的文件作为系统文件，当在 Trimble Geomatics Office或 Feature and Attribute Editor工具中增加或修改线式样时，产生的线式样是可得到的线式样。

一种线式样

  是解释一条线如何在Trimble Geomatics Office中被拉伸的定义。

  包括已经在Line Type Editor工具中被产生的线型。

在Line Type Editor工具中产生一个线型不自动使它作为Trimble Geomatics Office中的线型而可得到。一条线被分配一种线式样。一种线式样必须使用最新产生的线型来定义。

Line Type Editor工具用Trimble Geomatics Office使用的当前符号库自动打开。在被打开的库中的线型名称显示在屏幕上的一张表中。使用这张表编辑线型。

能运行Trimble Geomatics Office的独立编辑器。从Trimble Geomatics Office文件夹中选择Line Type Editor工具的快捷图标。

注释:  当运行Trimble Geomatics Office的独立编辑器时，对系统线型库所做的任何变化都不反映在当前项目中。为了查看这些被使用的变化，关闭并且在保存对线型库的变化后再打开项目。被保存的变化在线型库中变得可得到。

为了获得更多的信息，参见Trimble Symbol Editor工具的帮助。


格网工厂
网格工厂

使用自定义安装选项安装 Trimble Grid Factory™ 工具。

一旦它被安装,访问它，有以下几种方法：

  当没有项目打开时，选择工具/网格工厂。

  随时从Microsoft Windows的Start菜单选择。

使用 Trimble Grid Factory工具来和基准网格(*.dgf)文件和大地水准面网格(*.ggf)文件一起工作。

使用这个工具从现有网格中产生附属网或使多重现有网格和一个单独网格相结合。附属网基准网格文件和大地水准面模型网格文件用于Trimble Geomatics Office中。

如果使用Grid Factory工具产生大地水准面网格文件，保证输入的新文件名称与在Trimble Coordinate System Manager�工具中产生的大地水准面模型名称相同。

如果被覆盖的地理区域大，网格大。

例如, OSU91大地水准面网格大约2Mb。数据记录器和接收机通常没有足够的多余内存来保存许多数据。OSU91网格覆盖整个地球，但是大多数测量员不需要太大的覆盖范围。测量员仅仅代表性地需要数十或数百平方公里。覆盖较小区域的网格在大小上通常仅仅是几百个字节。

用Grid Factory工具产生覆盖当地区域的大地水准面模型附属网格文件。这些文件足够小以至被上载到用于当地区域的Trimble Survey Controller (版本 6 或6以后的) 设备。

许多Trimble产品与用于Grid Factory工具中的基准转换和大地水准面模型的网格文件一起被提供。Grid Factory工具也输入外国的网格文件并且把它们转换成Trimble网格格式。

为了获得更多的信息，参见Trimble Grid Factory工具的帮助。


DC文件编辑器

Trimble DC File Editor™工具编辑测量控制器(*.dc)文件。

访问它,有以下几种方法：

  当没有项目打开时，选择工具/ DC 文件编辑器。

  随时从Microsoft Windows的Start菜单选择。

注:  Trimble建议在Trimble Geomatics Office中完成所有编辑。这可以保证在编辑期间如果在Trimble Geomatics Office中发生任何问题，总有原始数据回到设备文件。

使用Trimble DC File Editor工具编辑文件，从下列设备：

  Trimble设备

  Sokkia SDR设备(直到版本 4-03 )

  能被转换成SDR 格式的任何设备

使用 Trimble DC File Editor工具编辑.dc文件的内容。例如,能改变在野外采集的错误数据或增加在野外无法获得的信息。

注:不能编辑属性或改变要素和属性库信息。

为了获得更多的信息，参见Trimble DC File Editor工具的帮助。


要素和属性编辑器

对于要素代码处理和GIS属性数据采集，使用 Trimble Feature and Attribute Editor�工具管理要素和属性库(*.fcl)文件。

访问它，有以下几种方法：

  当没有项目打开时，选择工具/要素和属性编辑器。

  随时从Microsoft Windows的Start菜单选择。

使用 Trimble Feature and Attribute Editor工具查看或编辑要素和属性库文件。要素和属性库用于：

  要素代码处理

  属性采集

.fcl是包含要素，CAD式样，和控制代码定义的一个文本文件。要素定义包括：

  要素代码

  在有与它们相关的要素的点上被执行的CAD程序

  对于要素被需要的属性

能产生新的要素和属性库。也能使用Trimble Geomatics Office默认当前表格中的要素和属性库，或修改库更好地适合个人的要求。

为了获得更多的信息，参见Trimble Feature and Attribute Editor工具的帮助。


坐标系统管理器

Trimble Coordinate System Manager™工具访问坐标系统数据库( Current.csd )。

访问它,有以下几种方法：

  当没有项目打开时，选择工具/坐标系统经理。

  随时从Microsoft Windows的Start菜单选择。

用Trimble坐标系统管理器工具能定义新的：

  椭球参数

  基准转换

  坐标系统

  测站定义

  大地水准面模型

注：大多数用户不需要使用Trimble坐标系统管理器工具，因为Trimble提供了一大组预先规定的坐标系统定义。如果需要增加一个附加的坐标系统定义，仅仅使用Trimble坐标系统管理器工具。

Trimble Geomatics Office使用坐标系统数据库确定在一个项目中选择坐标系统，大地水准面模型，和测站中的哪个可得到。

注：测站能在Trimble Geomatics Office或坐标系统管理器工具中产生，并且存储在测量数据库中。

为了获得更多的信息，参见Trimble 坐标系统管理器工具联机帮助或Trimble Geomatics Office用户指南。


计划

计划工具帮助计划和安排GPS地域时间。在计划GPS时间前使用工具确定对于GPS测量的适当条件。

访问计划工具，有以下几种方法：

  当没有项目打开时，选择工具/计划。

  随时从Microsoft Windows的Start菜单选择。

任务计划通常是管理一个测量项目的第一阶段。目的是定义项目的所有重要方面以便它能有效地并且高效地在所有可预见的条件下被施行。如果你正在进行实时动态( RTK )测量：

  使用计划工具检查要获得已知点的初始值至少捕获四颗卫星，要获得on-the-fly初始值捕获五颗卫星。

  检查位置精度衰减( PDOP )值确定卫星的几何条件合适于精确实时定位。

注： 计划工具不直接与Trimble Geomatics Office项目相联系并且不存储时间描述。能定义时间并且在相同的程序运行期间使用它们。

计划工具帮助：

  通过表格和图形表示，显示和预报卫星可用性。

试验卫星选择、年历、时间地区，可看见障碍物的测站、和高程。

  确定时间的最好观测时期，假设关于PDOP的必要限制和外业测量队工作期间的时间。

为了获得更多的信息，参见计划工具中的帮助。


转换成RINEX

接收机独立转换( RINEX )格式是由接收机采集的GPS数据的ASCII表示。转换成RINEX工具把使用Trimble测量接收机采集的二进制.dat格式文件转换成ASCII  RINEX格式文件。能在Trimble Geomatics Office中独立运行工具。

访问转换成RINEX工具，有以下几种方法：

  当没有项目打开时，选择工具/转换成RINEX。

  随时从Microsoft Windows的Start菜单选择。

使用工具：

  选择转换文件

  设置转换参数

  设置天线和标题的输出文件信息

  把被选择的文件转换成RINEX格式

转换成RINEX工具能产生三种RINEX 文件类型：

  观测值(具有测站天线信息的原始GPS观测值)

  导航(GPS轨道)

  气象(压力，温度，和相对湿度)

在缺省的情况下，工具产生RINEX 观测值和导航文件。也可以选择产生一个RINEX气象文件。

为了获得更多的信息，参考 Trimble Convert to RINEX工具帮助。


A1 阅读器

A1 阅读器工具查看GPSurvey项目档案(*.A1)文件的内容，然后摘录(保存)被选择的文件到目的目录。 A1 阅读器工具独立于 GPSurvey 工作。因此，不需要在计算机上装载这个软件。在保存GPSurvey 项目数据文件以后，能在Trimble Geomatics Office中使用输入函数把数据输入当前项目。

访问A1 阅读器工具,有以下几种方法：

  当没有项目打开时，选择工具/A1阅读器。

  随时从Microsoft Windows的Start菜单选择。

GPSurvey坐标输入器

GPSurvey坐标输入器选项 (GPSurvey 坐标[curr_net.dat ]) 从Curr_net.dat文件中输入平差坐标。访问这个软件：

1.	选择文件/输入。显示导入对话框。

2.	在测量标签中，选择GPSurvey坐标 (curr_net.dat)，并点击确认。显示打开对话框。

注: 为导入成功，文件必须有 curr_net.dat 名。

3.	导航到文件，点击确认。

现在能从Curr_net.dat文件输入平差坐标。

被A1 阅读器工具支持的文件

仅仅被GPSurvey 存档的文件可用于查看：

  .ssf/.ssk 文件-这些文件包含从GPSurvey WAVE 处理器中得出的基线解。利用在输入对话框的测量标签中可得到的SSF/SSK文件( *.ssf ,*.ssf) 输入格式，它们被输入Trimble Geomatics Office项目中。

  GPS 数据文件-这些文件包含野外采集的原始GPS数据。文件的两种类型--*.dat(来自Trimble 接收机的原始GPS数据文件)和*.rnx(用于WAVE处理器的被转换的原始RINEX 数据文件)-当选择这个过滤器时，是可得到的。而且，两种文件类型(.dat 和.rnx) 使用 GPS 数据(*.dat)文件输入格式都被输进一个项目中。

注： 在GPS数据文件输入格式的打开文件对话框中查看可得到的*.rnx 文件。在类型区域的文件中，选择所有文件*.*。

  平差坐标文件-这些文件，Curr_net.dat和Coords.log, 包含来自 GPSurvey存档项目的平差坐标。Curr_net.dat文件用于把坐标输入Trimble Geomatics Office。Coords.log 文件在 ASCII 格式中并且仅仅使用文本编辑器查看。GPSurvey项目中的点能存在于地理或网格坐标格式和任何坐标系统中。为了使坐标输入正确工作，Trimble Geomatics Office项目坐标系统的坐标系统的属性必须与GPSurvey项目坐标系统的属性确实匹配。

使用GPSurvey 坐标(Curr_net.dat)输入格式把文件(Curr_net.dat)输入一个项目中。当文件( Curr_net.dat )被读时,软件识别GPSurvey平差期间被固定的坐标。在输入所有相同类型的坐标部分前，文件中必须至少有一个被固定的坐标部分( NE , e , h )。例如,在输入高程前，需要一个被固定的高程。所有被输入的部分被给一个控制质量。

  .ggf 文件-这些文件包含产生在，或输入进GPSurvey 项目中的当地大地水准面网格(*.ggf)文件的大地水准面数据。在TRIMNet增强版软件中，使用剩余的大地水准面建模函数，它们被产生。过滤器不显示GPSurvey软件中可得到的全球.ggf文件(即,WW15MGH,GEOID99)。在Trimble Geomatics Office中使用.ggf文件,把.ggf文件保存到程序文件\普通文件\Trimble\GeoData文件夹中,然后使用坐标系统管理器工具把 大地水准面增加到坐标系统数据库中。为了获得更多关于使用这个工具的信息，参考坐标系统管理器帮助。

在 TRIMNet 增强版中使用一个高度模式

当在 TRIMNet 增强版中使用一个高度模式从一个项目中输入GPSurvey 坐标时，Trimble Geomatics Office项目中的高度区域包含高程值。因为，在一个高度模式平差期间， TRIMNet 增强版使用高程的椭球高度区域(orthometric高度)。如果不知道用于 GPSurvey项目的模式，在GPSurvey中打开项目并且检查TRIMNet增强版的特殊控制设置。

使用精密星历信息

在WAVE软件基线处理期间，GPSurvey 项目存档功能不转存被使用的精密星历信息。如果精密星历信息在GPSurvey项目基线处理期间被使用，必须从最初的来源输入进Trimble Geomatics Office。


NGS 天线模型

能使用两个天线模型设置中的一个-Trimble或 NGS-用Trimble Geomatics Office。测量要求决定模型使用的天线设置。当使用定义在天线.ini中的不同的天线类型时，通常使用NGS 天线模型设置。

Trimble 天线设置作为缺省被安装。但是，要安装NGS天线模型，在GPS 基线处理形式对话框的全球标签中，从天线模型列表选择NGS选项。

运用tgongsu1.exe。访问这个文件：

  在Trimble Geomatics OfficeCD上定位它在\附加的工具\NGS天线模型目录。

在安装期间，要求选择需要使用的天线模型。如果选择NGS天线模型，软件增加NGS天线模型（*.ngs）文件到程序文件\普通文件\Trimble\配置目录。必须再运行天线模型安装程序转换到选择天线模型。

注：如果安装了基线处理模块，能仅仅运用NGS天线模型安装。


  测量视图命令

使用这个命令在测量视图中查看项目。

访问它,做下列之一：

  选择视图/测量。

  点击测量视图工具。


  测量视图 - 概述

 参见

在测量视图或计划视图中查看项目。

使用测量视图进行测量相关任务例如：

  检查GPS和地面观测值

  纠正错误数据。

一些菜单选项和工具栏仅仅用于测量视图。进行测量相关任务，例如基线处理，和网平差。

提示:同时查看项目的不同部分,产生多重窗口。为了获得更多的信息，参见新窗口命令。

查看测量数据

GPS和地面观测值作为线在测量视图中显示。

使用属性窗口，双击观测值行查看观测值，如果需要，编辑观测值。如果在限差之外产生不闭合或GPS观测值超过拒绝标准，错误标志显示在点或观测值上。

在测量图例标签 中，不同的线颜色代表从Legend Style设置中得出的不同状态。 控制点和网平差点在测量视图中也有特殊的显示。

在测量视图中可得到的任务

下列任务仅仅在测量视图中可得到：

  视图过滤器

  选择观测值

  GPS 环闭合差报告

选项

如果安装基线处理模块和网平差模块，更多得测量相关任务可得到。下列表格显示从每个模块得到的附加任务。

基线处理模块

网平差模块

改变视图

能在任何时候改变视图。

改变计划视图，做下列之一：

  点击计划视图工具。

  选择视图/计划。


  计划视图命令

使用这个命令在计划视图中查看项目。

访问它,做下列之一：

  选择视图/计划。

  点击计划视图工具。


     计划视图 - 概述

 参见

在计划视图或测量视图中查看项目。

在外业测量期间，使用计划视图查看被观测的地形要素：

能增加点，线，式样，和注解改进项目的描述。在计划视图中做的任何变化不影响下面的测量观测值。

一些菜单选项和工具栏仅仅在计划视图中可得到。这些选项实施CAD相关任务(例如要素代码，层控制，和式样管理)。

提示:同时查看项目的不同部分,产生多重窗口。为了获得更多的信息，参见新窗口命令。

实体(点，线，曲线，弧，文本，和注解)根据被给的式样显示。能由要素代码或使用属性窗口改变一个实体的式样。GPS和常规的观测值不被显示。如果在计划视图中增加行，正在把一个新实体加到数据库中。

如果改变到测量视图，CAD行不显示。

一旦在计划视图中完成了任务，能打印或输出计划到设计软件包里。

在计划视图中可得到的任务

下列任务仅仅在计划视图中可得到的：

  层

  式样(点,线,文本)

  插入点

  插入线工作

  插入文本

  插入注解

  插入当前观测值的线工作

  由层选择

  由式样选择

  由类型选择

  由点要素选择

  要素代码

  DTM链接

  路径链接

改变视图

能在任何时候改变视图。

改变到测量视图，做下列之一：

  点击测量视图工具。

  选择视图/测量。

  按Alt+1


放大命令

使用这个命令放大图形窗口的部分。

访问它,做下列之一：

  选择视图/ 缩放 / 放大.

  点击放大工具 [image].

如果显示缩放浏览器,图形窗口视图中的区域作为缩放浏览器窗口中的黑框被显示。

使用放大工具：

1.	移动图形窗口上的指针。

放大镜指针显示封闭的一个加号。放大镜指针上的十字丝标记热点。

2.	做下列之一：

  在图形窗口中点击一个位置放大在热点上居中的两个中的一个因素。

  点击和拖拉指针穿过图形窗口产生包含需要放大的区域的一个矩形。区域越小,比例变化越大。当鼠标按钮被释放时，区域的内容由将占据全部图形窗口的矩形包括。取消放大工具中的当前操作,当按鼠标按钮时，按Esc。

如果有带滚轮的鼠标，使用滚轮放大和缩小。有滚轮的平面，保持滚轮在下面并且拖动鼠标。当鼠标移动时，移动图形窗口的内容。


缩小命令

使用这个工具增加显示在图形窗口的区域。

访问它,做下列之一：

  选择视图/ 缩放 / 缩小。

  点击缩小工具 [image].

如果缩放浏览器被显示, 图形窗口视图中的区域作为缩放浏览器窗口中的黑框被显示。如果缩小在项目的范围以外，没有黑框显示在缩放浏览器。

使用缩小工具：

1.	移动图形窗口上的指针。

放大镜指针显示封闭的一个减号。指针上的十字丝标记热点。

2.	做下列之一：

  在图形窗口中点击一个位置。图形窗口的比例变化，成为热点的居中位置。

  点击和拖拉指针穿过图形窗口产生包含需要的区域的一个矩形。然后释放鼠标按钮。图形窗口的变化比例，和以前出现在图形窗口中的信息显示在被选择的矩形区域。矩形越小，比例变化越大。取消缩小工具的当前操作,当按鼠标按钮时，按Esc。

如果有带滚轮的鼠标，使用滚轮放大和缩小。有滚轮的平面，保持滚轮在下面并且拖动鼠标。当鼠标移动时，移动图形窗口的内容。


缩放范围命令

使用这个命令查看当前项目中所有的可见点。当选择缩放范围命令时,图形窗口自动地调整以便所有数据都是可见的。

访问它,做下列之一：

  选择视图/缩放/范围。

  按Ctrl+E.

  点击缩放范围工具 [image].

  把指针放在图形窗口中。右键点击，从快捷菜单中选择缩放范围。


缩放先前的命令

当输入项目时，使用这个命令通过各个先前的缩放视图返回。

访问它,做下列之一：

  选择视图/缩放/先前的。

  点击缩放先前的工具 [image].

如果缩放浏览器被显示,图形窗口视图中的区域作为缩放浏览器窗口中的一个黑框被显示。如果缩小超过项目的范围，在缩放浏览器中不显示黑框。

如果有多个图形窗口打开，每个窗口单独的缩放堆被存储。


平移命令

使用这个命令转移缩放区域的中心，显示屏幕视图的不同区域。

访问它,做下列之一：

  选择视图/平移。

  点击平移工具 [image].

手指针出现。

如果缩放浏览器被显示,图形窗口视图中的区域作为缩放浏览器窗口中的一个黑框被显示。如果平移超出项目的范围, 在缩放浏览器中不显示黑框。

面板不作为缩放来记忆。因此,来自面板之前，不能实施先前的缩放返回原来的视图。

使用面板工具：

1.	移动图形窗口上的指针。

指针上的十字丝标记热点。

2.	点击并且拖动指针到想要到的面板。当移动鼠标时，实时移动图形窗口的内容。

如果有带滚轮的鼠标，使用滚轮放大和缩小。有滚轮的平面，保持滚轮在下面并且拖动鼠标。当鼠标移动时，移动图形窗口的内容。


平移到命令

在图形窗口中使用这个命令平移和缩放到特定位置。

平移到对话框出现。


平移到对话框

使用这句对话平移和缩放到图形窗口中的特定位置。

访问它,选择视图/ 平移到。

视图的中心

这些区域完成区域填充行动,例如指定视图中心的名称或位置。

Point name	使用这个区域指定数据库中点的名称。对于这个区域，如果使用区域填充，点名，北方向，东方向区域被填充。
Northing/Easting	使用这些区域确定视图中心的位置。如果使用去填充，北方向和东方向区域被填充。
查看半径

查看半径区域设置视图的范围。如果不指定一个单位，在项目属性对话框的单位和格式标签中，距离单位设置被使用。


    过滤器命令

使用这个命令打开视图过滤器对话框。

访问它,做下列之一：

  选择视图/过滤器。

  点击视图过滤器工具 [image].

  在状态栏中点击视图过滤器图标 [image] 。


    查看过滤器对话框

当在测量视图中工作时，使用这个对话框过滤任何不需要查看的观测值。

注: 在选择菜单中，被查看过滤器隐藏的数据不能使用任何命令来选择。

访问它,做下列之一：

  选择视图/过滤器。

  点击查看过滤器工具。

  按 Ctrl+F。

观测值

使用这个组选择需要查看的观测值组。如果有一个具有若干观测值类型的项目，这是有用的,例如，RTK和常规的,仅仅需要查看RTK观测值。

显示所有观测值

选择这个选项查看项目中的所有观测值。如果安装了网平差模块，选项出现。

仅仅显示为平差标记的观测值

选择这个选项仅仅查看选择用于网平差复选框的观测值。（这个复选框在属性窗口的摘要页中是可得到的。）

如果安装了网平差模块，选项出现。如果选择这个选项，观察组中的一些区域是不可得到的。

仅仅显示能被平差的观测值

选择这个选项仅仅查看能用于网平差的观测值，但是不必选择用于网平差复选框。（这个复选框在属性窗口的摘要页中是可得到的）。

例如,如果它们能被用于网平差，停用的观测值和启用的观测值作为检查能被选择。

可能的基线和常规的观测值(不能用于网平差)被过滤。

注:如果安装了网平差模块，选项出现。如果选择这个选项，观察组中的一些区域是不可得到的。

显示观测值类型

显示观测值类型组包含下列复选框：

  RTK

  后处理动态

  激光

  高程增量

  静态

  地面的

  归算的

  方位角

  未处理基线

使用这些复选框选择需要查看的观测值类型。例如,仅仅查看RTK矢量,选择RTK复选框并且在组中清除其它复选框。

  Sideshot 观测值？？？

  连续的

  停用的观测值

  检查观测值

使用这些复选框选择需要查看的被选择观测值类型中的观测值。必须指定需要下面组观测值过滤的上面组观测值类型。

例如,仅仅查看RTK检查观测值,选择RTK，检查观测值复选框并且在每个组中清除其它复选框。

注: 如果观测值有多个观测值属性，必须选择与查看的观测值类型相关的所有复选框。

显示不相连的点

选择这个复选框显示没有观测值输入和输出的点,例如,被键入的点。

显示事件

选择这个复选框显示事件。

仅仅在选择设置中显示数据

选择这个复选框显示先前保存为选择设置的数据。从表中选择选择设置。

利用时间安排显示独立的GPS基线

当这个复选框被选择时，仅仅被显示在时间安排视图中的观测值将显示在图形窗口中。

能使用这个工具选择独立的网平差基线。

在工具栏中使用独立基线视图按钮打开或关闭这个选项。

注:这个选项仅仅适用于后处理GPS数据。所有其它的数据将在图形窗口中被显示,与适合的查看过滤器一起使用。

注:如果安装了基线处理模块，这个选项仅仅是可得到的。

时间

选择这个复选框仅仅显示在指定日期和时间内的GPS观测值。起始区域被启用。

从/到

使用区域填充(从时间安排的时间尺中选择时间或使用键盘输入被显示的GPS 观测值的时间和日期范围。也能输入Julian天。


点标签 - 概述

更多信息

How to ...	See also
概述

在图形窗口中使用标签显示关于没有把那条信息存储到数据库的实体信息。标签在测量视图和计划视图中是可得到的。

当再次打开工作时间之间的项目时，标签设置被恢复。使用注解.在项目数据库中存贮关于实体的信息。仅仅能在计划视图中增加注解。

用区域和用户可定义的文本的联合标记点。增加自定义标签选项,使用文本编辑器编辑 Options.ini文件。标签总是显示在被标记的点的右边。

在Microsoft Windows Appearance设置中，使用分配到工具提示中的字体和大小来显示标签。


项目栏命令

使用这个命令显示和隐藏项目栏。

访问它,做下列之一：

  选择视图/项目栏。

  点击项目栏工具 [image].


刷新命令

使用这个命令刷新屏幕。

访问它,做下列之一：

  选择视图/刷新。

  按F5。

当图形窗口变成重写并且难以读时，选择这个命令刷新计划视图。


视图选项对话框

使用这个对话框设定数据的视图。访问它,选择视图/选项。

视图选项对话框有下列标签：

  网格线

  测量图例

  测量数据

  误差椭圆控制

  背景地图


视图选项对话框 - 点标记标签
点标记对话框

使用这个对话框显示项目的点标记。

访问它，从主菜单选择视图/点标记。

标记点

用需要标记的点选择区域。下列选项Trimble Geomatics Office一起被提供。使用 Options.ini 文件增加的任何自定义标记选项显示在这张表中：

  名称

  要素代码

  高程

  网格比例因子

  高程比例因子

  组合比例因子

  收敛角

  平面质量

  高程质量

  高度质量

应用于

点标记的两个选项是可得到的：

  选择-选择这个选项标记被选择的点。

  整个数据库-选择这个选项标记所有的点。在测量视图中没有选项被选择时，该选择被缺省选择。

当标记选择时，Trimble Geomatics Office自动产生被标记点的命名选择设置。

注: 一次仅仅能标记一个选择。如果有被标记点的选择，并且标记了新选择,第一次选择的标记被取消选择。

清除

点击清除移走所有当前标记。

注:如果用点标记再次打开一个项目，标签背景被恢复。

提示:改变文本的字体和大小,使用Microsoft Windows standard Windows显示工具提示设置。


视图选项对话框 - 格网线标签
视图选项对话框 - 网格线标签

使用这个标签显示图形窗口中的网格线。

访问它：

1.	选择视图/选项。视图选项对话框出现。

2.	在视图选项对话框中，选择网格线标签。

显示网格线

选择这个复选框在图形窗口中显示网格线。当网格线被显示时，网格间隔显示在状态栏中。

注: 在工具栏中，也能由选择网格线按钮显示网格线 [image] 。

下列项目变得可得到：

固定的网格线个数

使用这个选项设置显示在屏幕上的网格线个数。当放大或缩小时,网格线的相同个数将被显示。

注: 固定的网格线个数将沿着屏幕的最短边显示。

网格间隔

使用这个选项指定网格间隔。距离单位是项目中被指定的那些。

注:如果有太多清楚显示在屏幕上的网格线，不显示网格线。

网格线类型

使用这个选项选择网格线式样,例如,实心的或虚线的。

网格线颜色

使用这个选项选择网格线颜色。可能需要改变网格线的颜色以便它们清楚地反村在图形窗口的背景颜色中被显示出来。

标记网格线

用北方向和东方向值选择这个复选框标记网格线。

注:当选择绘图/打印命令.时，网格线将被打印。


视图选项对话框 - 测量图例标签

在 Trimble Geomatics Office图形窗口中，使用这个标签改变用来显示项目的颜色。它决定：

  不同的观测值类型和点如何显示在测量视图中

  图形窗口的背景颜色

  对于文本的默认颜色

访问它：

1.	选择视图/选项。视图选项对话框出现。

2.	选择测量图例标签。

图例式样

在这个区域中，选择的黑色或默认颜色。下列表格描述每个选项的颜色设置，决定：

设置项...	缺省Windows颜色方案	深色方案
图形窗口中文本的缺省颜色	Window 控制面板中的文本颜色	白色
Trimble Geomatics Office 图形窗口的颜色	Window 控制面板中的文本颜色	黑色
图形窗口中所选实体的颜色	控制面板中所选条目的颜色	红色
多于一种的观测值(例如两点间的地面观测值和RTK观测值)	黑色	白色
实时动态(RTK)	蓝色	蓝色
后处理静态基线	橙色	黄色
常规观测值	深绿色	深绿色
激光测距仪观测值	浅绿色	浅绿色
调整后的观测值	绿色	绿色
潜在基线 (两点见GPS数据重叠)	灰色	灰色
失效基线	深红色	深红色
作为检查的任何观测值	按照观测类型设定的颜色的虚线	按照观测类型设定的颜色的虚线
标记的观测值	红色	红色
连续RTK	浅蓝色	浅蓝色
后处理动态(PPK)	蓝色	蓝色
连续PPK	浅蓝色	浅蓝色
普通点	黑色点	白色点
测站	蓝色圆圈	黄色圆圈
3D 控制点	蓝色双三角	白色双三角
平面控制点	蓝色单三角	白色单三角
垂直控制点	蓝色框	白色框
网平差点	实心黄色圆圈	实心黄色圆圈
事件标记	实心蓝色圆圈	实心蓝色圆圈


视图选项对话框 - 测量数据标签

在图形窗口中使用这个标签改变显示测量数据的方法。

访问它：

1.	选择视图/选项。视图选项对话框出现。

2.	选择测量数据标签。

注: 当在测量视图中时，这个标签仅仅是可见的。

使用sideshots的短截线矢量

选择这个复选框作为短截线显示sideshot观测值矢量。

显示观测值的个数(>1)

选择这个复选框显示多重观测线上的观测值的个数。

当观测值被过滤时，观测值的个数作为正在显示的观测值个数和全部观测值个数的比率被显示,例如, 1/3。


视图选项对话框 - 误差椭圆控制标签

使用这个标签确定平差后是否在图形窗口中出现误差椭圆，高度误差箭头，和高程误差箭头。也能确定误差椭圆的比例和检查标记的大小。

访问它：

1.	选择视图/选项。视图选项对话框出现。

2.	选择误差椭圆控制标签。

注: 当在测量视图中时，这个标签仅仅是可得到的。

显示点误差椭圆和箭头

选择这个复选框显示点误差椭圆和箭头。

显示高程误差

选择这个复选框显示高程误差。

显示高度误差

选择这个复选框显示高度误差。

误差椭圆的比例

平差后，显示在下面的误差椭圆的滑尺比例,控制图形窗口中显示的误差椭圆的大小。

要使椭圆更小,把滑尺向左边移动。要使椭圆更大, 把滑尺向右边移动。

记号标记的大小

在图形窗口中，使用显示在下面的这个区域,确定显示在误差椭圆工具栏比例中的记号标记之间的距离。

当记号标记之间的距离变得与显示在记号标记区域的大小中的值相匹配时，当大小增加，工具栏比例变得更长。


视图选项对话框 - 背景地图标签

Trimble Geomatics Office能在图形窗口中显示背景文件。能输入背景文件例如图形转换格式(.dxf), Windows 位图(.bmp),或标注的图象文件格式(.tif)文件来显示。Windows位图(.bmp),或标注的图象文件格式(.tif)文件必须根据地理进行参照，以便它们能被正确显示。

ESRI's World文件格式用作参照背景文件的参照。一个World文件是具有.tfw或.wld扩展的一个ASCII文本文件。对于World文件，Trimble Geomatics Office有下列要求。它们必须：

  存储在与相关的.dxf，.bmp或.tif文件相同的位置

  有与Trimble Geomatics Office项目相同的坐标系统。

  有与Trimble Geomatics Office项目相同的单位

注: Trimble Geomatics Office不支持文件的旋转。

使用背景地图标签选择一个背景文件来显示。

访问它：

1.	选择视图/选项。视图选项对话框出现。

2.	选择背景地图标签。

文件名称

这个组显示被选择作为背景地图使用的文件的一张表。

增加

使用增加钮扣选择背景文件。能选择一个.dxf，.bmp，或.tif 文件。

注释:保证相关的World文件存储在相同的位置。不需要在表中选择这个文件。

移开

使用移开按钮把背景文件从表中移开。

World文件格式

World文件格式的例子显示如下：

20.17541308822119

0.00000000000000

0.00000000000000

�20.17541308822119

424178.11472601280548

4313415.90726399607956

这六个值使用下式中的六参数仿射转换计算image-to-world 转换：

x1 = Ax + By + C

y1 = Dx + Ey + F

这里

x1 	地图中被计算的象素的x坐标

y1 	地图中被计算的象素的y坐标

x 	图象中象素的列个数

y 	图象中象素的行个数

A 	x-比例;在x方向上，地图单位中的一个象素的尺寸

B, D	旋转项

C, F	平移项; 左上方象素的中心的x ,y地图坐标;

E 	y-比例的负数；在y方向上，地图单位中的一个象素的尺寸

转换参数按下列顺序存储在world文件中：

20.17541308822119 � A

0.00000000000000 � D

0.00000000000000 � B

-20.17541308822119 � E

424178.11472601280548 � C

4313415.90726399607956 � F

注: Trimble Geomatics Office不旋转图象。如果world文件有非零旋转项( D和B参数),它们将不被使用。

注：x-比例(A)或y-比例（E）的符号根据坐标系统的方向改变。这是因为一幅图象的原点和地理坐标系统是不同的。图象的原点总是位于左上角，而地理坐标系统的原点根据坐标系统的方向改变。

例如，对于NE坐标系统，地图坐标系统的原点在左下角。图象的行值从左上角向下增加，而地图的y-坐标值从左下角向上增加。因此，对于NE系统，y-比例（E）是负值。下表总结了应该用于NE、SE和NW坐标系统的x-和y-比例的符号：

	NE	SW	NW
x(A)	+ve	-ve	-ve
y(E)	-ve	+ve	-ve


质量保证

非质量保证条款

除了“有限质量保证”中的条款，Trimble 硬件、软件、固件和文档被标记为 揳s is� ，Trimble导航有限公司或跟其创作、生产或销售有关的人员不对其销量和特殊用途的适用性进行任何保证。 Trimble 硬件、软件、固件和文档的质量和运行方面的的全部风险由您本人承担。某些国家要求必须进行隐含保证的国家，上述申明不适用。

有限责任

Trimble公司或与此创作、生产、发行有关的任何人，在任何情况下都不对其产品的损坏、如利润损失、资金损失或其它特殊性、偶然性、必然性或先例性的损坏进行赔偿，其中包括估计或可能的损失以及其它的索赔要求等。对于要求必须对偶然性和必然性损坏进行保证的国家，上述申明不适用。

软件和固件有限保证

Trimble公司保证所有软件和固件产品在与其它专门设计的Trimble产品、计算机产品和操作系统一起使用时，遵守已公布的规范。从产品运离Trimble公司30天后开始，90天内Trimble公司保证软件和固件所分布的磁性介质及其文本在材料和做工上没有缺陷。在90天保证期内，Trimble公司可免费调换有缺陷的介质和文本，或修改内部程序错误。如果Trimble公司不能调换或修改，将退还软件购买费用。这是唯一的违约赔偿方法。


欢迎使用Trimble Geomatics Office�帮助文件。

此帮助文件向您提供相关信息，帮助您有效使用Trimble Geomatics Office 的所有功能。同时也指导您安装和使用Trimble Geomatics Office。

  使用帮助

  Trimble Geomatics Office � 概述

  关于Trimble

  反馈


新建窗口命令

使用此命令可为当前项目打开另外的窗口.

访问此功能,选择 窗口/新建窗口.

每个新建的窗口被增加在窗口菜单的窗口列表中.

新建窗口与活动窗口内容相同,可以同时打开多个窗口分别显示或浏览项目的不同部分.例如, 可以在打开不同的窗口,并在每个窗口中显示项目的某个层.

如果改变某个窗口中的内容,所有其他包含相同项目的窗口都将更新,以显示最新的变化结果.

当打开一个新窗口时,此窗口是活动窗口并显示在其他所有打开的窗口之上.


层叠命令

此命令用于将多个打开的项目窗口重叠显示.

访问此窗口,选择窗口/层叠.

窗口重叠显示可以使使用者看到每个窗口的标题.


排列命令

此命令用于将目前打开的所有项目窗口进行排列显示.

访问此命令,选择窗口/排列.

  窗口按照并排的模式重新布置.


排列图标命令

使用此命令可重新布置最小化窗口的图标,使之在屏幕上整齐地显示.

访问此命令,选择窗口/排列图标.

图标重新排列在窗口底部.


拆分命令

此命令可用于同时显示项目的两个部分.

访问此命令,选择窗口/拆分.

窗口中的裂缝可通过点击和拖拉裂缝条调整尺寸.窗口某部分的变化同时影响到另一部分.


显示列表命令

此命令用于打开显示列表中的窗口.此列表显示所有打开的窗口.

访问此功能,在窗口显示列表菜单中选择要打开的窗口.


全球互联网址

要与Trimble进行交互式联系， 请访问全球互联网址
(http://www.trimble.com/)


属性窗口 - 概述

属性窗口可以看到所有的实体中的信息(点,观察值,线,弧度,曲线,文字，注释，注解)。

使用属性窗口查看并且编辑被选择的实体的属性。一次仅能查看一个实体的属性。在属性窗口中实体的任何变化都很快被使用。

属性窗口在窗口框架中可点击和拖拉。点击顶部的右边角落按钮消除窗口。

当使用 Trimble Geomatics Office的另外部分时，能使属性窗口打开。属性窗口自动更新显示选择设置的正确的信息。

如果定义了一个当前的选择设置并且从属性窗口选择序列中选择一个实体来查看,在图形窗口中的当前选择更新仅仅包括正在查看的实体。属性窗口选择序列保留原来的选择设置。在属性窗口选择序列中任何被加亮的实体都变成图形窗口中的当前选择设置。

在属性窗口中的子目录查看显示屏幕上被选择的项目的名字和数值。子目录查看显示实体之间的关系。例如,能通过点击加号(+)来查看任何观测值或线型的“起点”和“终点”并且选择想要查看和编辑的点。

在节点查看能被解除或扩展：

  点击加号(+)扩展子目录查看。

  点击减号(-)解除子目录查看。

在属性窗口右边所得到的信息和标签取决于当前被选择的实体类型。

属性窗口选择工具

属性窗口选择工具用于设置的选择序列。

选项	图标	点击后 ...
组测量数据		按来源,数据类型或观测方向的组测量数据.
排序		在所选列表中对实体进行排序.从表中选择想要的项目.并选择按数据库顺序,高程,名称,质量,起始时间,观测长度或数据类型进行排序.
过滤		只保留点,观测值,标记的观测值或当前选择集.也可以删除当前所选项. 注意: 可以在过滤表中增加自定义的查询 方式
质量指示器

质量指示器是出现在概要页面的每个域的右边的小标志。这些标志显示出测量数据的质量。质量可以是固定控制,控制,测量,制图,未知,或平差。质量指示器也用于点来源报告和重新计算报告中。

大地水准面指示器

大地水准面指示器显示是否一个点的高程或高度成分是从被定义于的工程中的大地水准面中得到。大地水准面指示器与质量指示器一起出现。

例如，如果测量一个实时动态点，它有一个WGS-84高度和从大地水准面中导出的高程。如果采集一个地面点，它有一个高程和从大地水准面中导出的WGS-84高度。

大地水准面指示器也用于点来源报告和重新计算报告中。

大地水准面模型的大地水准面质量被工程属性对话的重新计算标签决定。

自动上滚工具

使用本工具 [image] 可以在图形窗口中选择实体时最小化图形窗口。

锁定窗口打开

使用本工具｛bmc properties_lockwindow.bmp｝可以确保打开属性窗口时其尺寸不变。


属性窗口 - 测量标签 - 概述

在选择中使用测量标签来查看和编辑一个实体的测量关系属性。能查看出现在测量视窗中的实体的性质，例如：

  点

  GPS观测值

  常规观测值

  水平面观测值

  激光射程探测观测值

  减少的观测值(偏移量)

页面

测量信息在页面中被组织。一次仅能查看一页。使用可用的菜单按钮能存取页面。菜单按钮存取所有的测量信息并且取决于当前被选择的实体类型。

删除点和观测值

删除一个点或观测值, 在属性窗口中使用删除按钮 [image] 。如果一个点或观测值不能被删除，删除钮扣是不能用的。

注：一个固定的坐标不能被删除。在删除它以前不固定坐标。


属性窗口 - 测量标签 - 点

 概述

在属性窗口中使用测量标签来查看和编辑被选择点的测量关系信息。测量信息在页面中被组织。

通过点击适当的菜单按钮能存取下列页：

概要
警告
观测值和设置
错误估计


属性窗口 - 测量标签 - 摘要页(点)

更多信息

 如何做

在属性窗口中使用摘要页来查看被选择点的被导出的位置和质量。

访问它, 从属性窗口：

 在测量标签中，点击摘要菜单按钮 [image] 。

点名

显示点的名字。在此域中输入一个值改变名字。

坐标域

显示被导出的点的位置并将质量赋值到每个部分。被显示的坐标域依赖于设置的显示选项。

网格/当地/ WGS-84

选择用于点的坐标显示的选项。

注：如果显示选项被设置到 WGS-84，在工程属性对话的单位和格式标签中，被显示了的坐标域将取决于设置于显示WGS-84的设置。例如,如果显示WGS-84作为域被设置成L，L, H，在摘要页面中的坐标域作为纬度，经度，高度被标记。如果显示WGS-84作为域被设置成X，Y, Z ，WGS-84域作为 X，Y, Z被显示。

来源报告

选择来源报告工具来显示选择推导报告工具 [image] 来显示点来源报告。

添加坐标

当想键入一个网格，当地的或 WGS-84的办公输入坐标时，选择增加坐标工具 [image] 。（当想使软件优先使用办公室输入坐标，而不是从观测值导出的坐标时，才能进行此操作。） 键入坐标的来源为办公室输入。

仅能有与一个点相关的一个网格/当地的和一个WGS-84办公室输入坐标。如果已存在一个WGS-84 和一个网格或当地坐标，则添加坐标工具无效。

注：当添加一个坐标时，坐标分量域及其质量是空的。要输入当前的点位置和质量，选择插入当前值工具 [image] 。


属性窗口 - 测量标签 - 警告页

使用警告页来查看和禁止与警告标志相联系的出现在测量视窗上的点或观测值上的信息。

方法是：

1.	进行以下一项操作：

  双击想要看的有警告指示标志的一个点或观测值。

  在状态栏中双击警告标志图标选择所有具有警告指示标志的点。

属性窗口出现。

2.	如果在选择中有许多实体，选择想要看的实体。

3.	访问警告页，点击警告菜单按钮 [image] 。

应该在输出坐标前解决或禁止所有的警告标志。当不容许的闭合通过停用坏观测值或如果观测值是到一个不同的物理点，重命名点解决时，错误标志将消失。

下列表描述可以与警告标志一起出现的信息：

禁止这条信息

选择此复选框来禁止与被选择的点或观测值相联系的警告标志,如果决定错误对于测量是可接受的。在属性窗口中标志变成白色并且从图形窗口中消失。

注:如果禁止所有的警告标志,在状态栏中标志图标变成白色。

如果选择一个点，然后能选择点推导工具 [image] 来查看点推导报告

使用此来决定点的位置如何被导出并且错误为什么发生。


属性窗口 - 测量标签 - 观测值和设置页

在属性窗口中使用观测值和设置页来查看和改正所选点或观测值的GPS观测值或地面设置的详细信息。

下列页是可得到的，取决于被选择的实体类型和使用的域方法：

野外方式	页细节	菜单按钮
GPS 观测	基线观测
	流动站观测
安置常规方式	目标设立

从属性窗口访问这些页：

1.	选择观测值。

2.	点击观测值和安装菜单按钮button [image] 。

注：对于一个点如果有多个观测或安装，快捷菜单出现。选择想要查看的页。当在快捷菜单中把鼠标放在不同的观测值和设置项上时，细节在页中被更新。

一个点有多个观测值；然而一个观测值仅仅有一个“起点”和一个“终点”。


属性窗口 - 测量标签 - GPS观测值页

使用GPS观测值页来查看和改正所选点的GPS观测值的详细信息。如果点作为基准站或流动位置使用，页的内容是一样的。

从属性窗口访问它：

1.	选择测量标签。

2.	进行以下一项操作：

  如果选择一个点，点击观测值和设置菜单按钮 [image] 。

注：对于一个点如果有多个观测值或设置项，快捷菜单出现。选择想要查看的页。

  如果选择一个GPS观测值，点击基准站观测值页按钮 [image] 来查看基准站观测值的详细信息；或点击流动站观测值菜单按钮 [image] 来查看流动站观测值的详细信息。

点

显示被观测点的名称。

时间

显示观测的长度(及时)和观测的开始时间。

注：在数据输入期间，开始和结束时间从GPS 时间转换成UTC(通用协调时间-有效的格林威治标准时间)。时间显示为Microsoft Windows时区中的当地时间。

提示: 将指针放在该域上来显示观测的结束时间的工具提示。

天线详细资料

天线详细资料组织包括用于被观测点的观测值的GPS天线的详细资料。

高度

显示天线高度。在观测期间如果高度输入不正确，使用键盘输入一个值来改变此域。

类型

显示连结接收机的天线类型。在观测期间如果天线输入不正确，从表中选择一种天线类型来改变此域。

测量

显示测得的天线高度。在观测期间如果方法输入不正确，从表中选择一个选项来改变此域。


属性窗口 - 测量标签 - 仪器设置页

使用仪器设置页来查看和改正用于观测的常规仪器的设置详细资料。

从属性窗口访问它：

1.	选择测量标签。

2.	选择一个点，点击观测值和设置菜单按钮 [image] 。

注：对于一个点如果有多个观测值和设置项，快捷菜单出现。选择想要看的仪器设置页。对于该点的所有观测值都能在这里查看- GPS和地面。

仪器点

显示被采用观测值的点的名字。

仪器高度

当观测值被采用时，显示仪器的高度。在安装期间如果高度输入不正确，使用键盘输入一个值来改变此域。

后视点

显示被观测的后视点的名字。

后视方位角

显示被观测的后视的被计算的方位角。

注：如果后视点有坐标，这些坐标被用来决定后视点的方位角。如果输入存在的方位角，输入的方位角的质量与用于后视点的被计算的方位角作比较。最高质量的方位角被使用。如果被计算的方位角的质量和输入的方位角是相同的，用于后视坐标的被计算的方位角被使用。


属性窗口 - 测量标签 - 目标设置页

使用目标设置页来查看和改正用于常规测量的目标设置详细资料。

从属性窗口访问此页面：

1.	选择测量标签。

2.	选择常规测量，点击目标设置菜单按钮 [image] 查看目标设置详细说明。

前视点

显示前视点的名字。

目标高度

当前视观测值被采用时，显示目标的高度。在设置时如果高度输入不正确，使用键盘输入一个值来改变此域。

棱镜常数

显示被用于观测的目标的棱镜常数。在安装期间如果常数没被输入或输入不正确,使用键盘输入一个值来改变此域。

域可以显示‘?’，因为观测值已经具有用在文件中的棱镜常数，并且文件不指定常数。如果在设置期间产生误差，并且如果棱镜常数被不正确地输入，那么，要应用输入域中的棱镜常数与应该输入的棱镜常数之间的差值。例如，如果在域中输入“20”，而应该输入的值是“5”，那么棱镜常数域中应输入“-15”作为改正。


属性窗口 - 测量标签 - GPS坐标(APC)页

使用GPS坐标(APC)来查看GPS定位结果。一个定位结果可从下列获得：

  差分GPS

  广域增强系统(WAAS)

  用 [image] 键入Trimble Survey Controller

  自动定位

  VRS � 广域RTK (固定和浮动)

如果它们是测量或制图质量，对于一个点定位结果将被显示。能有多个定位结果，但是这些值不能被编辑。

从属性窗口访问页：

1.	在图形窗口中，双击包括GPS坐标的点( APC )。

2.	在属性窗口子目录里扩展点。

3.	从树形图 [image] 中选择 C?soln，其中的 ? 显示坐标数字。

GPS坐标(APC) 页被显示。

点

显示点的名称。

纬度，经度，高度

显示WGS-84的坐标和决定于点的点质量。

注：显示的高度是测量标记的高度, 而不是在观测中使用的GPS天线的天线相位中心。天线高度不被使用。

处理器类型

显示处理方法。例如，WAAS, 广域RTK。

状态

显示定位结果的状态。状态被重计算,或当测量计算被进行时考虑。改变此域, 点击箭头并且从想要使用的点的下拉表中选择选项。


属性窗口 - 测量标签 - 坐标页

更多信息

 也请参见

使用坐标页来查看被选择点的坐标。也能使用它来改变坐标的质量和状态。

一个点可以有一个WGS-84坐标，一个网格/当地坐标，和平差坐标。进行了网平差以后，就能产生平差坐标(如果安装了网平差模块)。

使用摘要页来查看点坐标。

访问坐标页：

1.	在图形窗口中，双击点。出现属性窗口。

2.	扩展点的子目录并且选择坐标。

点的坐标被显示出。

坐标域

显示点的坐标部分值和质量分配。被显示的坐标域依赖于显示选项设置，并且如果当前视窗与保存的坐标类型一样，仅仅是可编辑的。

网格/当地/ WGS-84

为点选择坐标显示选项。

注：如果显示选择被设置到 WGS-84，被显示的坐标域将取决于作为设置在工程属性对话中的单位和格式化标签的显示 WGS-84的设置。例如,如果显示WGS-84作为域被设置成L，L, H，在摘要页面中的坐标域作为纬度，经度，高度被标记。如果显示WGS-84作为域被设置成X，Y, Z ，WGS-84域作为 X，Y, Z被显示。

质量选择控制

使用质量选择控制把质量分配到坐标部分。质量按递减顺序被列出：

  控制

  测量

  制图

未知的

状态

显示被选择点的状态。一个点的状态被重计算, 或当测量计算被进行时考虑。改变此域, 点击箭头并且从想要使用的点的下拉表中选择选项。

如果不想使用它来得出点的位置，停用此坐标。

如果没有其它的用于获得点的位置观测值或坐标，若仅仅想要坐标被使用，使坐标作为一个检核。

重新计算报告将报告能作为检核但不能使用的坐标。

坐标类型

在被选坐标类型中坐标被保存在数据库里。如果保存坐标作为一种不同的类型，有相同类型的任何存在的坐标将被覆盖。

在属性窗口中为了获得关于坐标的更多信息，参考属性窗口主题中的坐标(链接到此主题)。


属性窗口 - 测量标签 - GPS观测值

在任何GPS 观测值类型例如实时动态、静态、快速静态和后处理动态矢量上可查看信息。

在属性窗口中使用测量标签来查看和编辑被选择的GPS观测值的测量相关信息。测量信息在页中被组织。

点击适当的菜单按钮访问下列页：

摘要
警告
基准站观测值
流动站观测值
观测值
观测静态


属性窗口 - 测量标签 - 摘要页(GPS观测值)

在属性窗口中摘要页摘要被选择的GPS观测值的观测详细资料。

1. 在测量视窗中选择GPS观测值。

2. 从属性窗口访问它：

点击摘要菜单按钮 [image] 。

起

显示开始观测的参考点的名字。

止

显示结束观测的流动点的名字。

时间

当它被开始时及时显示观测的长度。

注：在数据输入期间开始和结束时间从GPS 时间转换成UTC(通用协调时间-有效的格林威治标准时间)。然后时间作为用于设置在微软窗口中的当前时间地区的当地时间被显示。

提示: 在域上安置指示器来显示观测的结束时间的工具提示。

处理器类型

显示被选择的观测值的处理器类型。分类关系到用于决定观测值解算的处理器。处理器类型域为：

  RTK

  静态或FastStatic

  PPKinematic

  未处理:未处理处理器类型显示可能是，但不是由基线处理器决定的观测值解算。

域方法

显示用于观测值的GPS测量方法。

  地形

  连续

  已测量控制

  快速

  静态或FastStatic

  事件

  走走停停

状态

显示被选择的观测值的状态。观测值的状态被重计算，或当测量计算被进行时考虑。使用此域来停用坏的观测值(例如当观测值发生不闭合时)。

改变此域, 点击箭头并且从想要使用的点的下拉表中选择选项。

如果不想使用它来获得点的位置，停用此观测值。

如果没有其它的用于获得点的位置观测值或坐标，若仅仅想要观测值被使用，使坐标作为一个检核。

重新计算报告将报告能作为检核但不能使用的观测值。

用于网平差

如果不需要用于网平差的被选观测值，清除此复选框(如果安装了网平差模块),但是当数据库被重新计算计算时，仍然被使用。

如果观测值没有协方差信息或标准误差信息，此选项被停用。

如果观测值被停用，此选项被停用。


属性窗口 - 测量标签 - 观测值页( GPS观测值)

使用观测值页来选择激活的解和查看被选观测值的基线部分。

1. 在测量视窗中选择基线。

2. 从属性窗口中访问它：

点击观测值菜单按钮 [image] 。

激活的解

显示激活的基线解。如果处理基线超过一次(当基线处理模块被安装时)使用不同的处理式样，并且在GPS处理对话中选择不覆盖复制基线解,基线能有多个解。基线仅仅有一个激活的解。此解被用于重新计算和网平差。点击箭头并且从需要的观测值的下拉表中选择最优解。

提示: 在解上安置指示器来显示基线解的工具提示。

解类型

显示被选择的观测值的观测值解类型。

X的增量,Y 的增量, Z 的增量

当显示选项被设置成XYZ时，根据WGS-84笛卡尔坐标系统显示GPS基线的增量值。

NS方位角, 椭球距离, 高度增量

当显示选项被设置成大地测量时，根据当地椭球显示GPS基线部分。

注：NS方位角参考参考点到流动点方向的法方向NS(大地测量)方位角。

北方向增量, 东方向增量, 向上方向增量

当显示选项被设置成NEU时，显示在当地大地测量平面上的北方向增量,东方向增量,和向上方向增量。

显示地面到地面的详细资料

选择此复选框来显示归算到被参考点和流动点上的接收机占用的标记的地面高度的基线部分。

如果复选框被清除，从参考天线相位中心到流动天线相位中心的基线部分的值被显示。下列图形显示出这些差别。


属性窗口 - 测量标签 -- 观测值页面 (GPS 观测值)(Position Solution)
属性窗口 - 测量标签 - 观测值页面（位置解算）

使用观测值页面来选择有效的解并查看所选观测值的基线构成：

1.	在测量视图中选择基线。

2.	从属性窗口访问它，点击观测值菜单按钮 [image] 。

处理器类型

显示处理的方法。例如，WAAS或广阔RTK。

域方法

显示所用的域方法，例如，连续。

解算类型

显示所选观测值的观测值解算，例如，L1浮动。


属性窗口 - 测量标签 - 观测值统计页( GPS观测值)

观测值统计显示取决于基线观测值类型的适当的解的统计和质量指示器。统计不同于实时动态测量而不是静态/后处理测量。

使用这页检查解的质量。

1. 在测量视窗中选择基线。

2. 从属性窗口访问它：

点击观测值统计菜单按钮 [image] 。

如果正在查看实时动态观测值，在观测值统计页中下列域出现：

测量的个数

显示用于完成观测的测量个数(历元)。

最小卫星个数

显示观测期间被基准接收机和流动接收机追踪的最小卫星个数。

均方根误差

显示均方根误差(RMS)。均方根误差值显示了用于决定基线解的测量的精度。

斜距

显示测量的斜距。

平面精度

显示用于决定观测值解的测量的平面精度。

垂直精度

显示用于决定观测值解的测量的垂直精度。

PDOP/RDOP

显示用于实时动态基线的位置精度衰减因子(PDOP )，或静态基线的相对精度衰减因子( RDOP )。 RDOP随时间减少。

如果正在查看一条后处理基线，在观测值统计页中的下列域出现：

比率

显示在最适合观测的整周搜索处理器中产生的两个方差的比率。

参考方差

显示参考方差。参考方差是显示基线观测数据如何适合被计算的解的指示器。

均方根误差

显示均方根误差.。均方根误差值表示了用于决定基线解的观测的精度。

斜距

显示观测的斜距。

平面精度

显示用于决定观测值解的测量的平面精度。

垂直精度

显示用于决定观测值解的测量的垂直精度。

RDOP

显示相对精度衰减因子值。


属性窗口 - 测量标签 - 观测值统计页面 (位置解算)

观测值统计页面显示适当的解算统计和质量指示器类型。

使用此页面来检查解的质量：

1.	在测量视图中选择基线。

2.	从属性窗口访问它，点击观测值统计菜单按钮 [image] 。

水平精度

显示用来决定位置解算的测量水平精度。

垂直精度

显示用来决定位置解算的测量垂直精度。

RMS

显示平方根（RMS）。RMS值表明用来决定基线解算的测量精度。

PDOP

显示基线的位置精度因子(PDOP)。

最小卫星数

观测期间显示的被追踪卫星最小数目。

GPS位置数

显示用于解算的GPS位置数目。


属性窗口 - 测量标签 - 常规观测值

查看在野外使用常规仪器例如全站仪或经纬仪测得的任何地面观测值的信息。

在属性窗口中使用测量标签来查看被选择的常规观测值的测量相关信息和编辑安装详细说明。测量信息在页中被组织。

点击适当的菜单按钮访问下列页：

摘要
目标安置
观测值
观测值统计


属性窗口 - 测量标签 - 摘要页(常规观测值)

在属性窗口中摘要页摘要被选常规观测值的观测详细资料。

1. 在测量视窗中选择观测值。

2. 从属性窗口访问它：

  点击摘要菜单按钮 [image] 。

仪器点

显示用于开始观测的仪器安装的点名。

仪器高

显示仪器的高度。

后视点

显示作为后视的点的名字。

前视点

显示结束观测的目标点的名字。

状态

显示被选择的观测值的状态。观测值的状态被重计算或当测量计算被进行时考虑。

改变此域, 点击箭头并且从要使用的观测值的下拉表中选择选项。

如果不想使用它来获得点的位置，停用此观测值。

如果观测值在后视点上有一个检查，能使观测值作为一个检查。这将保证闭合将被报导但是观测值将不被用来决定坐标。

重新计算报告将报告能作为检核但不能使用的观测值。

用于网平差

如果不需要用于网平差的被选择的观测值(如果安装了网平差模块), 但是仍然需要它用于重新计算, 清除此复选框。


属性窗口 - 测量标签 - 观测值页(常规观测值)

使用观测值页来查看被选观测值的仪器和目标之间观测值部分。

1. 在测量视窗中选择观测值。

2. 从属性窗口访问它：

点击观测值菜单按钮 [image] 。

后视方位角

显示仪器点和后视点之间的被计算的方位角和质量。

注：如果后视点有坐标，这些坐标被用来决定到后视点的方位角。如果键入的方位角也存在，键入的方位角的质量和用于后视点的被计算的方位角相比较。最高的质量的方位角被使用。如果被计算的方位角的质量和键入的方位角的质量是相同的，用于后视坐标的被计算的方位角被使用。

水平角度,垂直角度,斜距

当显示选项被设置成HA,VA,SD时，显示观测值部分的观测值。

方位角,水平距离,高程增量

当显示选项被设置成AZ,HD,VD时，显示归化到网格坐标系统的观测值部分的值。

注：在输入期间，大气改正、曲率和折光改正被用于观测值。平面观测值归化为来自后视点的一个角度。由于曲率和折光垂直角度被改正。百万分率改正被用于斜距。

观测值类型

当观测值被采用或盘1和盘2的观测值被平均时，显示所使用仪器的盘（1，2）值。平均观测值是盘1/盘2组观测值的平均数，在后视点和同一位置的观测点之间观测得到。

观测值也能从Trimble Survey Controller的平均转角得到(例如当圆环被观察时)。

显示地面到地面的详细资料

选择此复选框来显示归化为被仪器点和前视点观测值的标记的地面高度的观测值。

如果复选框被清除，从参考天线相位中心到流动天线相位中心的基线部分的值被显示。


属性窗口 - 测量标签 - 水准观测值

查看野外观测的任何水准观测值的信息。使用属性窗口的测量标签，查看被选择的水准观测值的测量相关信息。

测量标签中的信息在页 中被组织。访问页, 点击适当的菜单按钮, 显示如下：

摘要
静态观测值

注：如果想要使用水准观测数据进行网平差，必须有被定义的水准观测值的标准误差。在下列情况中标准误差被计算：

  如果输入数字水准数据，在编辑平差式样对话框 (地面控制标签)中，用于转角个数和读数尺错误的标准误差被计算。

  在Trimble Data Exchange Format中输入水准数据。如果在Trimble Data Exchange Format中包括转角个数，基于转角个数的高程增量标准误差被计算。如果在Trimble Data Exchange Format中包括高程增量标准误差值，此值被使用。

如果一个标准误差没被定义或计算，水准观测值不被用于平差。

在属性窗口.中输入每个观测值的标准误差。


  属性窗口 - 测量标签 - 摘要页(水准观测值)

在属性窗口中摘要页摘要被选择的水准观测值的观测详细资料。

 1 .选择水准观测值。

 2 .从属性窗口访问页：

点击摘要菜单按钮 [image] 。

起点

显示水准起点的点名。

终点

显示水准终点的点名。

高程增量

显示“起”点和“终”点之间的高程变化。

状态

从这张表中, 选择需要的观测值。此状态在重新计算或测量计算期间被考虑。

如果在一个点上的观测值有一个检查，此观测值能作为一个检查。这保证闭合被报导但是观测值将不被用来决定高程。如果不想要用于决定点的位置的观测值，停用它。

重新计算报告说明能作为检查水准观测值，然而并非停用该观测值。


属性窗口 - 测量标签 - 观测值统计页(水准观测值)

观测值统计显示适当的统计和质量指示器。

从属性窗口访问它：

  在测量标签中，点击观测值统计菜单按钮 [image] 。

标准误差(高程增量)

此值说明高程增量标准误差。误差被计算：

  输入数字水准文件(基于转角个数和水准尺读数误差的高程增量标准误差被计算)。

  在Trimble Data Exchange Format中输入水准数据。如果在Trimble Data Exchange Format中包括转角个数，基于转角个数的高程增量标准误差被计算。如果在Trimble Data Exchange Format中包括高程增量标准误差的值，此值被使用。

也能输入自定的标准误差。

转角个数

决定两个点之间的高程增量的仪器安装个数。

路线长度

水准环的长度。它由增加的后视和前视距离计算。


属性窗口 - 测量标签 - 激光测距仪观测值

在野外使用激光测距仪测量的任何地面观测值的全部信息。

在属性窗口中使用测量标签查看和编辑被选择的激光测距仪观测值的测量相关信息。测量信息在页中被组织。

点击适当的菜单按钮访问下列页:

摘要
观测值


属性窗口 - 测量标签 - 摘要页(激光测距仪观测值)

在属性窗口中摘要页摘要被选择的激光测距仪观测值的观测详细资料。

从属性窗口访问它：

  在测量标签上，点击摘要菜单按钮 [image] 。

仪器点

显示激光测距仪观测的起点。

仪器高

显示仪器的高度。

目标点

显示激光测距仪观测的终点。

目标高

显示目标的高度。

状态

显示被选择的观测值的状态。观测值的状态在重新计算，或进行测量计算时被考虑。改变此域,点击箭头从想要使用的观测值的下拉表中选择选项。

如果不想用它获得点的位置，停用该观测值。

如果没有其它的用于获得点的位置的观测值或坐标，若仅仅想要观测值被使用，使坐标作为一个检核。

重新计算报告将报告能作为检核但不能使用的观测值。


属性窗口 - 测量标签 - 观测值页(激光测距仪观测值)

使用观测值页来查看观测值部分和编辑用于被选择的观测值的仪器和目标安装之间的磁偏。

从属性窗口访问它：

  选择测量标签，点击观测值菜单按钮 [image] 。

磁方位角

显示被观测的观测值的磁方位角。

偏差

显示磁北极和真北极之间的磁偏。此值被用来计算真方位角。使用键盘输入一个值改变此域。

垂直角度

当观测值被采用时，显示被测量的垂直角度。如果此值是空的，它被假设为距离是水平的。

斜距

显示观测值的斜距。


属性窗口 - 注释标签

 概述

在数据库中,注释纪录是非图形实体。即它们不出现并且不能在图形窗口中被选择。

如果从包含使用者输入注释的Trimble Survey Controller中输入一个工作，在属性窗口中使用注释标签来查看和编辑注释记录。

访问它，-

1.	进行以下一项操作：

  选择选择设置。选择包含想要查看的注释的.dc文件。

  选择选择/按询问/注释。

2.	打开属性窗口。

属性窗口显示有铅笔图标的所有注释实体 [image] 。


属性窗口 - CAD标签(点)

在属性窗口中使用CAD标签来查看和编辑被选择点的CAD相关信息。

图层

显示被选择的点被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

点式样

查看或从表中选择点式样。

要素代码

查看或输入被选择的点的要素代码值。

描述

查看或输入被选择的点的描述。


属性窗口 - 直线标签

使用直线标签来查看和编辑所选的直线实体的域。

访问它,在计划视窗中进行以下一项操作：

  双击线状实体。

  从图形窗口选择线状实体并且打开属性窗口。

起点

显示被选择的线的“起”点名字。使用键盘输入点名来改变此域。

终点

显示被选择的线的“终”点名字。使用键盘输入点名来改变此域。

方位角

显示“起”点和“终”点之间的方位角。

距离

显示“起”点和“终”点之间的距离。

图层

显示被选择的线状实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

线式样

显示被选择的线的线式样。从表中选择一种线式样来改变此域。


属性窗口 - 曲线标签

使用曲线标签来查看和编辑被选择的曲线实体的域。

访问它,在计划视窗中进行以下一项操作：

  双击曲线实体。

  从图形窗口中选择曲线实体并且打开属性窗口。

起点

显示被选择的曲线的“起”点名字。使用键盘输入点名来改变此域。

终点

显示被选择的曲线的“终”点名字。使用键盘输入点名来改变此域。

进入正切,退出正切

显示被选择的曲线的正切。使用键盘输入一个值来改变这些域。

弦长

定义被选择的曲线的宽度。输入0和1之间的一个值来改变此域。

图层

显示被选择的曲线实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

线式样

显示被选择的曲线的线式样。从表中选择一种线式样来改变此域。


属性窗口 - 弧标签

使用弧标签来查看和编辑被选择的弧的域。

访问它,在计划视窗中进行以下一项操作：

  双击弧实体。

  从图形窗口中选择弧实体并且打开属性窗口。

起点

显示被选择的弧的“起”点名字。使用键盘输入点名来改变此域。

终点

显示被选择的弧的“终”点名字。使用键盘输入点名来改变此域。

中心

显示被选择的弧的“中”点的名字。使用键盘输入点名来改变此域。

北方,东方

显示弧的中点的坐标。使用键盘输入值来改变这些域。

注：如果弧的中点被定义，坐标不被使用。中点被使用。

图层

显示被选择的弧实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

线式样

显示被选择的弧的线式样。从表中选择一种线式样来改变此域。

小于180 度的弧

在缺省的情况下复选框被选择。清除复选框使用被选择的大于180 度的弧度。


属性窗口 - 点注释标签

使用点注解标签来查看和编辑被分配到点的被选择的注解实体的域。

访问它, 在计划视窗中进行以下一项操作：

  双击注解实体。

  从图形窗口种选择注解实体并且打开属性窗口。

点

显示被选择的注解实体被分配到的点的名字。

文本表示

显示被选择的注解实体的文本表示。文本表示可以是一个文本定义或被插入到注解模板的域代码。使用键盘输入一个值来改变此域。

横坐标，纵坐标

显示所选注释实体的缺省“基线左侧”位置的坐标。使用键盘输入一个值来改变这些域。

方位

显示注解实体的方位。使用键盘输入一个值来改变此域。

图层

显示被选择的注解实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

文本式样

显示被选择的注解实体的文本式样。从表中选择一种文本式样来改变此域。


属性窗口 - 线注释标签

使用线注解标签来查看和编辑被分配到线实体的被选择的注解实体的域。

访问它,在计划视窗中进行以下一项操作：

  双击注解实体。

  从图形窗口中选择注解实体并且打开属性窗口。

线

显示用于定义被选择的注解实体被分配到的线的点的名字。

文本表示

显示被选择的注解实体的文本表示。文本表示可以是一个文本定义或被插入到注解模板的域代码。使用键盘输入一个值来改变此域。

横坐标，纵坐标

显示所选注释实体的缺省“基线左侧”位置的坐标。使用键盘输入一个值来改变这些域。

方位

显示注解实体的方位。使用键盘输入一个值来改变此域。

图层

显示被选择的注解实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

文本式样

显示被选择的注解实体的文本式样。从表中选择一种文本式样来改变此域。


属性窗口 - 弧注释标签

使用弧注释标签来查看和编辑被分配到弧实体的被选择的注释实体的域。

访问它, 在计划视窗中进行以下一项操作：

  双击注释实体。

  从图形窗口中选择注释实体并且打开属性窗口。

弧

显示用来定义被选择的注释实体被分配到的弧的点的名字。

文本表示

显示被选择的注释实体的文本表示。文本表示可以是一个文本定义或被插入到注释模板的域代码。使用键盘输入一个值来改变此域。

横坐标，纵坐标

显示所选注释实体的缺省“基线左侧”位置的坐标。使用键盘输入一个值来改变这些域。

方位

显示注释实体的方位。使用键盘输入一个值来改变此域。

图层

显示被选择的注释实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

文本式样

显示被选择的注释实体的文本式样。从表中选择一种文本式样来改变此域。


属性窗口 - 文本标签

使用文本标签来查看和编辑被选择的文本实体的域。

访问它, 在计划视窗中进行以下一项操作：

  双击文本实体。

  从图形窗口中选择文本实体并且打开属性窗口。

文本表示

显示被选择的文本实体的文本表示。文本表示可以是一个文本定义或被插入的域代码。使用键盘输入一个值来改变此域。

横坐标，纵坐标

显示所选注释实体的缺省“基线左侧”位置的坐标。使用键盘输入一个值来改变这些域。

方位

显示文本实体的方位。使用键盘输入一个值来改变此域。

图层

显示被选择的文本实体被分配到的图层。从表中选择图层或使用键盘输入一个新图层的名字来改变此域。

文本式样

显示被选择的文本实体的文本式样。从表中选择一种文本式样来改变此域。


属性窗口 - 属性标签

使用属性窗口的属性标签来管理工程中的属性。在Trimble Geomatics Office中属性窗口查看，编辑，增加和删除属性。

访问它, 从属性窗口：

  选择属性标签。

注：在得到属性标签以前，必须建立属性工程。

属性选择工具

属性选择工具显示点被选择的当前属性。如果点有多个与它相关的属性，点击箭头并且从想要查看的下拉表中选择属性。

属性名字

显示与被选择的点相关的被选择的属性的属性名字。

值

显示与被选择的点相关的被选择的属性的属性值。编辑属性值，点击适当的域并且从表中选择一个值;或如果菜单表不可得到，使用键盘在域中输入一个值。


属性窗口 - 普通标签

当没有任何实体被选择时打开属性窗口，或者在属性窗口选择表中有多个加亮的实体时，显示属性窗口的普通标签。

普通标签显示信息“没有可得到的属性”。

查看一个实体的属性,在图形窗口中或在属性窗口的选择表中选择一个实体。


属性窗口 - 测量标签 - 归算的观测值

查看关于归算的地面观测值例如使用Trimble Survey Controller在野外测得的偏移量的完部信息。

在属性窗口中使用测量标签来查看和编辑被选择的观测值的测量相关信息。在页中组织测量信息。

在测量标签中访问一页, 点击菜单按钮。下列页被访问：

摘要
观测值


属性窗口 - 测量标签 - 摘要页(归算的观测值)

在属性窗口中摘要页概述被选择的归算观测值的详细资料。

在属性窗口中访问它：

  选择测量标签。点击摘要页按钮 [image] 。

起点

显示开始测量的点的名字。

终点

显示结束测量的点的名字。

状态

显示被选择的偏移观测值的状态。观测值的状态在重新计算或当进行测量计算时被考虑。改变此域, 点击箭头并且在想要使用的观测值的下拉表中选择选项。


属性窗口 - 测量标签 - 观测值页(归算的观测值)

使用观测值页来查看归算观测值的观测值部分。

在属性窗口中访问它：

  选择测量标签。点击观测值菜单按钮 [image] 。

方位角

显示观测值的被测量的方位角。

水平距离

显示观测值的被测量的水平距离。

垂直距离

显示观测值的被测量的垂直距离。


坐标 - 概述

更多信息

 也请参见

把一个点的已知坐标输入Trimble Geomatics Office工程，此坐标与该点的其它的测量数据一起被存储。每个点有输入WGS-84 坐标的一个用户和输入网格/当地坐标的一个用户的最大值。

如果编辑一个被输入坐标的现有用户，旧坐标被新坐标代替。

输入现有的点坐标用于：

  属性窗口/增加新坐标按钮

  点对话框 (如果安装了Network Adjustment模块)

  输入一个数据库中已经存在的点坐标文件

用键盘输入坐标方式输入新点的坐标用于：

  插入点对话框

  输入一个数据库中不存在的点坐标文件

输入进Trimble Geomatics Office的任何坐标作为点的内在坐标被增加并且能在属性窗口的单独的坐标页中被查看。

注：使用摘要页查看点的位置。如果对于一点的观测值它的质量是相同的（或更高），输入的坐标将用于点的定位。


属性窗口 - 放样标签 - 概述

放样标签显示在域中使用 Trimble Survey Controller的偏移点的信息。下列页可从放样标签中得到：

  放样

  线性的详细说明

  切点

  图层

  DTM


属性窗口 - 放样标签 - 放样偏移页

使用放样偏移页来查看设计点和放样点的位置之间的差别。

在属性窗口中访问它：

  选择放样标签。点击放样偏移量菜单按钮 [image] 。

方法

此域说明放样要素。例如，一个点，一条线，一段弧，或一条道路。

如果选择极选项，显示下列域：

方位角

此域说明从设计点到偏移点的方位角。

长度

此域说明从设计点到偏移点的距离。

如果选择网格增量选项，显示下列域：

北方向增量

此域说明从设计点和偏移点之间在东方向上的差别。

东方向增量

此域说明从设计点和偏移点之间在北方向上的差别。

如果选择位置和偏移量选项，显示下列域。

位置增量

此域说明设计点和偏移点之间在距离上的差别(平行于设计中心线)。

偏移量增量

此域说明设计点和偏移点之间在距离上的差别(到设计中心线的直角)。

高程增量

此域说明设计点(在偏移的点上)和偏移点之间在高程上的差别。

挖方/填方

此域说明设计点(在实际偏移的点上)和偏移点之间在高程上的差别。

高程增量和挖方/填方值将是一样的，除非：

  设计表面不是水平面, 并且

  在偏移点上水平误差有严重的误差

当设计表面不是水平面时，下列图形说明高程增量和挖方/填方之间差别。

图 1 -高程增量和挖方/填方之间差别

如果偏移点是一个切点,被报导的增量是从偏移位置到被计算的切点。


属性窗口 - 偏移标签 - 线性详细资料
属性窗口 � 放样标签 - 线性详细资料

使用线性详细资料页来查看线性要素的偏移详细资料(例如，一条线，一段弧，或一条道路)。

在属性窗口中访问它：

  选择放样标签。点击线性详细资料菜单按钮 [image] 。

名字

此域说明放样点的线性要素的名称。

位置

此域说明被选择的定位点的设计位置。

水平面偏移量

此域说明从设计的到偏移点的水平面偏移量。对于一条道路，此域说明水平构造的偏移量。

垂直偏移量

此域说明从设计的到偏移点的垂直偏移量。对于一条道路，此域说明垂直构造的偏移量。

如果一条道路已被放样，显示下列域：

设计偏移量

此域说明偏移点的设计偏移量。

设计高程

此域说明偏移点的设计高程。

要素名字

此域说明要素名字。

水平偏移方式

此域说明如何使用水平偏移。水平偏移用于：

  水平

  以上一模板元素的坡度


属性窗口 - 放样标签 - 切点

使用切点页来查看切点的详细资料。此选项仅仅当一条道路上的放样点是切点的时候可得到。

在属性窗口访问它：

  选择放样标签。点击切点菜单按钮 [image] 。

设计平面与实际平面相交的点被当做切点。下列图表显示出一条道路的典型的横截面：

这里：

A =到中线的距离

B =从切点到连接点的水平距离

C =从切点到连接点的垂直距离

D =边坡

E =到连接点的斜距

F =构造水平放样量

G =开挖沟宽度

H =连接点

J = 切点

斜侧面

此域显示斜侧面值。

开挖沟宽度

此域显示开挖沟宽度值。在图表上它被表示为“G”。

斜侧面类型

此域显示斜侧面类型(例如,挖方或填方)。

到中线的水平距离

此域显示从放样的切点到中心线的水平距离。

高程

此域显示切点的放样高程。

到连接点的水平距离

此域显示从切点到绞链的水平距离。

到连接点的垂直距离

此域显示从切点到绞链的垂直距离。

到连接点的斜距

此域显示从切点到绞链的斜距。

斜距+构造偏移量

此域显示从放样点到连接点的斜距。在图表上它被显示为从连接点“H” 到被定义点的斜距。此点由投射定义斜侧面直到它与放样位置相交。此值将是空的(?)，如果：

  没有使用水平构造偏移量

  水平构造偏移量应用于水平方向


属性窗口 - 放样标签 - 信息牌

使用信息牌来查看从切点到模板上的点的距离。

在属性窗口访问它：

  选择放样标签。点击信息牌菜单按钮 [image] 。

名字

此域显示模板上的点的名字。

从切点起的水平距离

此域显示从切点到模板上的点的水平距离。

从切点起的垂直距离

此域显示从切点到模板上的点的垂直距离。


属性窗口 - 放样标签 - DTM

使用DTM页来查看关于放样DTM点的详细说明。

在属性窗口访问它：

  选择放样标签，点击DTM菜单按钮 [image] 。

DTM名字

此域显示DTM的名字。

垂直放样量

此域显示DTM 和放样表面之间的指定的垂直放样量。

挖方/填方

此域显示DTM(包括垂直放样量)和放样点之间高程上的差别。


属性窗口 - 测量标签 - 方位角观测值

在属性窗口中使用测量标签来查看和编辑方位角观测值。测量信息被组织进页。

点击适当的菜单按钮访问一页,显示如下：

摘要
警告
观侧值统计


属性窗口 - 测量标签 - 摘要页(方位角观测值)

在属性窗口中摘要页概述被选择的方位角观测值的观测值详细资料。

1.  在测量视窗中选择方位角观测值。

2.  在属性窗口中访问它，点击摘要菜单按钮 [image] 。

注： 方位角观测值被给AZ前缀。

起点

显示开始观测的参考点的名字。

终点

显示结束方位角观测的点的名字。

方位角

此域显示起点和终点之间的方位角。一个网格或外法方向方位角能被显示。当方位角类型和方位角视窗域相同时，此域仅仅是可编辑的。

质量

显示方位角观测值的质量。

方位角类型

此组显示是否方位角被作为一个网格或法截线向前方位角存储在数据库中。不能编辑此域。

注：如果终点没有方位角, 网格方位角和外法方向方位角之间的转换不能计算。在这种情况下，方位角被显示为空的(?)。

方位角视窗

在属性窗口中使用视窗选项来选择如何显示方位角：

  网格-选择此选项来显示网格方位角。

  外法方向-选择此选项来显示法截线向前方位角。

注：如果想要编辑方位角域，方位角类型域中的信息和这些视窗选项必须相同。

状态

从这张表中,选择观测值状态。此状态在重新计算，或测量计算期间被考虑。

如果仅仅想要一个观测值用于决定一个点的位置，如果没有其它的观测值或可得到的坐标,使观测值作一个检查。如果不需要观测值用于决定点的位置，(例如，如果观测值产生闭合差)可停用它。

重新计算报告说明能作为检查的观测值，但并非停用的观测值。

用于网平差

如果不需要选择观测值用于网平差，清除此复选框(如果安装了Network Adjustment模块)，但是当数据库重新计算时，仍然使用。


属性窗口 - 测量标签 - 观测值统计页(方位角观测值)

观测值统计页显示适当解的统计和质量指示器,取决于被选择的观测值类型。对于方位角观测值，显示标准误差。使用该页检查解的质量。

在属性窗口中访问它：

  选择测量标签，点击观测值统计菜单按钮 [image] 。

标准误差

使用此域输入方位角观测值的标准误差。

注： 在平差中，0°00'00"的标准误差固定方位角。


属性窗口中的坐标

对于属性窗口中的一个点，Trimble Geomatics Office能增加坐标，使用增加坐标按钮 [image] 。当点击此按钮时，快捷菜单出现。从此菜单中，选择需要增加的坐标类型，即,WGS-84,网格,或当地的。保留的点坐标和坐标的来源，在属性窗口的左边子目录表中显示。

输入的坐标的有限个数与一个点相关。对于每个点，仅能输入一个WGS-84坐标和一个网格/当地坐标。如果已经增加了一个WGS-84坐标，WGS-84坐标选项变得无法获得。

当确定需要用此坐标代替观测值时，仅仅增加一个坐标,因为在相同质量的优先考虑的观测值中重新计算使用被键入的坐标。这保证设计点被用于优先考虑的偏移观测值中。

注：前缀添加到输入的坐标名字表示坐标是否坐标是网格(G)，当地的(L)或WGS-84(W)坐标。

对于一个点，附加的坐标能由Trimble Geomatics Office产生并且存储。这些坐标包括：

  由平差获得的坐标

  被平差的WGS-84坐标保存于校准点

当增加一个坐标时，坐标部分显示为空的(?)。使用插入当前值按钮 [image] 组装具有坐标部分当前值和质量的每个坐标部分域，在摘要页中显示。当选择需要组装的坐标部分域时，此按钮可使用。

编辑坐标

能编辑输入的坐标。但是，不能编辑附加的坐标,例如软件产生的平差和校准坐标。

如果当前视窗与作为坐标类型设置的保存一样，仅能编辑坐标部分。当编辑坐标部分时，来源被改变成办公输入，或多重来源如果仅一些部分被编辑。

多重来源坐标

在属性窗口中显示的坐标来源。如果从两个或更多的来源获得坐标,它作为多重来源被显示。例如，如果一个点的平面坐标从输入文件得到，并且在Trimble Geomatics Office中输入高程，该点作为从多重来源得出的坐标被显示出。

提示:在坐标页中使用工具提示检查每个坐标部分的来源。

移动坐标

当坐标在Trimble Geomatics Office中被移动或转换时，停用所有的观测值。如果想要在移动或转换后使用这些坐标，必须启用它们。使用多重编辑对话 框做此工作。

删除坐标

删除坐标，使用删除按钮 [image] 。

注：用于平差的固定坐标不能被编辑。

坐标质量

在属性窗口中显示的每个坐标将有分配的坐标质量。下列坐标质量能被编辑：

  控制质量

  测量质量

  制图质量

  未知质量

不能改变固定的控制点的质量。


属性窗口 - 测量标签 - 事件页

在属性窗口中使用测量标签来查看事件数据。

在属性窗口中访问它：

  选择测量标签，点击事件菜单按钮 [image] 。

接收机事件标识符

此域显示事件的标识符。

插值方法

此域显示插值方法是线性的或二次的。

符合点

此域显示用来符合插值弧的点的个数。

接收机接口标识符

此域显示接收机接口标识符。

解类型

此域显示解类型

均方根误差

显示RMS值。

状态

从这张表中选择需要的观测值的状态。此状态在重新计算，或测量计算期间被考虑。


属性窗口 - 测站和偏移标签

测站和偏移标签显示有关在Trimble设备中用测站和偏移程序测定的点信息。

从属性窗口：

1.	选择测站和偏移标签。

2.	点击测站/偏移按钮。

名称

本域包含线性要素的名称。

测站

本域包含在已测量点线性要素上的测站。

注：对于Trimble 3300仪器，如果有来自基准行的建筑偏移，则偏移显示在名称域中此行的起始和终止点名称旁。

偏移

本域包含至已测量点线性要素的偏移。

高程变量

本域包含在线性要素与已测量点之间的高程差值。


    GPS 点校正 - 概述

更多信息

如何作 ...	对话框
概述

GPS点校正过程建立了GPS接收机采集的WGS-84数据与地方控制位置之间的关系(表达为海平面上的地方地图网格)。采用了一系列的数学转换定义了此关系。 GPS点校正功能允许进行GPS和校正所用地方控制点的匹配(GPS坐标必须从GPS点和观测值得到，网格点必须从网格点和地面观测值得到)。Trimble Geomatics Office计算并采用最小二乘法进行数学转换，并可在任何时间进行重新校正。

将WGS-84位置转换到网格坐标的数学转换是：

基准转换，从WGS-84纬度，经度和椭球高度坐标转换到相对于地方测图网格椭球的纬度，经度和椭球高度坐标。

地图投影，从地方椭球纬度和经度坐标到转换到地方测图网格的北向和东向坐标(此过程中高度值改变)

到WGS-84高度的大地水准面模型，得到海水面上的近似高程。

进行转换后的网格坐标的平面平差，以符合地方控制数据。此平差允许投影系统的任何地方变化，这在全面基准转换中是不能满足的。

将地方椭球高或由大地水准面得到的高程转换为地方海水面控制高程的高度平差。

要改变校正设置(确定允许的最高残差)，使用计算机登录。

上述水平和垂直平差另存为项目坐标系统定义的一部分。数据库中的所有GPS点都用校正参数更新，产生更精确的地方网格坐标值。

要将新的坐标系统定义(包括校正参数)另存为一个站点 供同一地区今后项目使用，点校正对话框.中的另存为站点。

如果将校正值另存为站点是为了在其它项目中使用该站点，确定项目区域被校正中使用的点封闭起来。例如，在下图中，站点定义对于项目B有效，但对项目C无效。

如果使用Trimble Survey Controller的 [image] 启动实时动态(RTK)基准站，并将Survey Controller (.dc)文件传送到Trimble Geomatics Office，基准站位置(及所有来自基准站的流动站点)性质都未知(对于所有分量，水平，垂直和高程。)

如果确定GPS点校正提高了点的质量，使用属性窗口改变基准点的性质。

注： 缺省时，如果用带有WGS-84坐标的RTK基准站点进行GPS点校正，点的网格坐标将变为无效。但是，可使用GPS点校正的网格位置。如果要这样做，需要激活网格坐标(确定它的质量高于WGS-84坐标)，通过数据类型和重新校正来产生点。用此方法的问题是，如果GPS向量从网格位置溢出：

  从基准点得到的任何GPS点都不能用于校正。

  会产生一个与校正残差相等的误差

注： 如果已经进行了GPS点校正，并选择了地方点设置对话框 中的地面坐标框，投影中定义的校正变为无效。一条错误信息会提示您继续操作将删除校正。

使用大地水准面模型

如果项目的坐标系统定义使用大地水准面模型获得点高程，则高程直接由内插到大地水准面模型网格的WGS-84高度确定。但是，也可以将高度平差应用到大地水准面模型产生的高程顶端，允许大规模大地水准面模型不能考虑到的小型局部变化。由垂直校正确定的高程为测量性质。

确定有效校正的规则

  WGS-84坐标必须相当正确。

可能自动产生GPS点。但是，在校正中使用的自动WGS-84不能多于一个，如必须确定只用 Trimble Survey Controller 的 [image] 建立了一个基准站。其它基准站必须建立在根据自动基准站由GPS向量测得的位置上。 这定义了它们之间的关系，可使您用来自任一基准站的点正确进行校正。以下对此进行了说明：

下图未显示基准站之间的关系：

来自基准站1和基准站2的点不应用于校正。

在下图中，基准站之间的关系通过用第一基准站观测第二基准站来确定：

来自基准站1和基准站2的点可用于校正。

  最可能的WGS-84坐标应当用于测量中的第一个基准站。

GPS向量的精度(实时或事后)受基准站坐标精度的影响。基准站坐标每十米的误差产生的向量精度误差可达百万分之一(1 ppm)。例如，基本WGS-84参考点误差为100米，基线长为2公里，产生的GPS向量误差可大到2厘米。


用登录改变校正设置

 概述和更多信息

安装Trimble Geomatics Office后，登录设置被添加到计算机控制系统中：

  在校正参数的最小二乘计算的迭代次数

  校正点的校正位置和网格位置间的最大误差

使用这些条目可在提出警告是进行控制。警告提示计算不能满足指定的最大误差指标。

登录条目

条目(最大误差和最大迭代次数)在登录密匙下：

HKEY_CURRENT_USER\Software\Trimble\Trimble Geomatics Office\1.6\Calibration

最大误差

要改变最大误差，使用此条目。其值是计算出的校正点位置和其相应的已知网格位置之间允许的水平极差（残差）。

如果超出指定的误差，会出现错误信息提示校正计算超出了定义的最大水平残差。

校正结果在下列情况下可能超出指定的最大误差：

  在网格控制点的输入中产生了误差

  在测量中任一控制点被错误识别或不正确的固定

  校正计算不能在指定的迭代次数内收敛。

最大误差域值越小，得到超出最大误差提示信息的可能性越大。这是因为确定的指标对于计算位置与已知位置的匹配过严。

该域的缺省值(通常以米确定)为0.1爉。

最大迭代次数

要改变迭代的最大此数，使用次条目。它控制校正参数的最小二乘计算中进行的迭代的最大次数。将此值设置得高一些可产生更多次的迭代，直到计算发现计算出的参数对于每次迭代不再有变化。

该值的有效范围为从5到5000。如果设置的值小于5，则使用最小值5。如果设置的值大于5000，则使用最大值5000次迭代。缺省的迭代次数为10。


GPS点校正命令

用次命令进行GPS点校正。

要访问它，选择测量/GPS点校正。

出现GPS点校正对话框。

注： 在GPS点校正对话框出现之前，如果定义了网平差转换参数，进行GPS点校正时它们将被放弃。如果点名与合并的点名相同，将有信息提示您是否根据数据类型产生点。


GPS点校正对话框

 概述和更多信息

用次对话框命令进行GPS点校正。

要访问它，选择测量/GPS点校正。

要进行GPS点校正：

1.	指定要计算的校正分量。

2.	定义坐标组。 一组是一个网格位置和一个同一自然点的GPS位置。

3.	将当前校正应用到数据库。

校正分量

校正分量组包含以下框和域：

基准转换

一般来说会有一个预先定义的基准转换，它是坐标系统定义的一部分。此基准转换可以是三或七参数转换，多重回归定义或者基于基准网格文件 (如NADCON)。在这些情况下，不可能计算不同的基准转换，因此将基准转换框保持为空。但是，如果没有恰当的基准转换信息，或对某些参数有怀疑，则可计算基准转换。

要计算WGS-84椭球和作为投影坐标系统定义一部分的地方椭球之间的基准转换，选择此框。三参数转换和七参数转换 选项有效。选择要计算的基准转换。

注： 此选项对于有缺省(Transverse Mercator)投影坐标系统的项目无效，因为缺省投影直接以不需基准转换的WGS-84椭球为基础。

如果计算基准转换且校正被应用到数据库，项目属性对话框中坐标系统标签的基准域显示为 '校正'。

更新缺省投影原点

此选项只在当前坐标系统定义使用缺省投影是有效。要用点列表中的第一个二维控制点更新投影原点，使用此项。由于缺省投影没有定义纵轴加常数和横轴加常数的纬度和经度起点，更新原点将确定投影原点是地方的 (即，接近项目中的测量数据)。

如果在已定义缺省投影的项目中进行GPS校正，则需要确定此框被清空，以确定不改变缺省投影定义。

水平平差

要计算水平平差，选择此项。设置比例因子为一框变为有效。如果不想缩放距离，用此项可将比例因子设为1。 水平平差是由北/南和东/西方向的平移量和沿确定的原点和比例因子的旋转量组成的平面转换。转换参数的计算是通过最小二乘方法找到最符合控制网格坐标的平差参数。

水平平差归算控制坐标和由GPS定位值计算出的网格坐标之间的残差。

提示：通常开始计算水平参数时不将比例因子设为一，以检查计算的比例因子是否接近一。如果计算出的比例因子不接近于一，表明所选的校正点对中可能存在问题。

垂直平差

要计算垂直平差，选择此项。这是由确定原点的垂直位移和北东方向上的倾斜度组成的倾斜平面平差。此平差参数的计算是通过最小二乘方法找到最符合由控制点高程的GPS高度得到的高程的平差平面。这需要三个三维校正点对。一个三维校正点对只能计算垂直平移量参数。如果两个三维校正点对可用，系统定义恰好符合这些点对的改正平面。

如果投影使用大地水准面模型，则计算垂直平差并将其应用到大地水准面模型改正面的顶端。

大地水准面模型

大地水准面模型域显示了作为坐标系统定义一部分的大地水准面模型名称。如果没有大地水准面模型，显示为 '无'。这是只显示域。大地水准面模型设置只能用项目属性对话框中的坐标系统标签进行改变。

点列表

点击点列表选择校正计算中要使用的校正点对。GPS点校正对话框被隐藏，出现点列表对话框。

计算概述

此组中的域显示了上次执行的校正计算的综合信息。用此信息确认计算出的校正值是有效的，不需要查看计算报告。

水平平差比例因子

水平平差比例因子域显示计算出的水平平差比例因子。如果选择了将比例因子设为1选项框，则此域显示为1。用此域可确认计算出的比例因子接近于1。如果不是，则表明一个或多个校正点对中存在问题。

最大垂直平差倾斜度

最大垂直平差倾斜度域显示基于坡度北向和坡度东向值计算的高度平差值的最大倾斜度。

最大水平残差和最大垂直残差

最大水平残差和最大垂直残差域显示上次报告的计算的最大残差值。

确定

点击确定将上次计算出的校正应用到数据库。

进行重新计算来确定的所有GPS点根据GPS校正进行更新。坐标系统信息根据校正参数更新。

要浏览校正详细信息：

1.	选择文件/项目属性。

2.	选择坐标系统标签。

3.	点击详细信息。

4.	选择水平平差标签或垂直平差标签。

取消

点击取消退出GPS点校正，不应用计算的校正值。

计算

点击计算在改变校正分量设置之后计算GPS校正参数。一旦进行了计算，结果就在显示在计算概述域中。

另存为站点

点击另存为站点将当前校正和坐标系统信息作为站点定义保存在坐标系统数据库中。出现另存为站点对话框。输入保存的站点定义并点击确定。也可用此站点定义作为今后项目的坐标系统定义。

坐标系统

点击坐标系统浏览项目的当前坐标系统详细信息。出现与文件/项目属性/坐标系统标签中的详细信息对话框相同的对话框。

报告

点击报告浏览校正计算的详细报告。此报告显示计算的所有参数及当前计算的控制点坐标与其已知位置和各残差值的比较列表。


GPS点校正 - 点列表对话框

用此对话框选择用于计算GPS点校正参数的校正点对。

要访问它：

1.	选择测量/GPS点校正。出现GPS点校正对话框。

2.	点击点列表。

出现GPS点校正-点列表对话框。

此框显示各组校正点对的卷动列表。对于计算校正需定义的点对数没有特别限制。添加大量的点对不一定会改善校正结果，但可对计算的参数的有效性进行检核。

每个校正点对由一个GPS点(带有GPS定位值的点或由GPS向量得到的点) 和一个不由GPS得到的网格点(通常为控制点，平差点或由地形观测值得到的点)组成。

注： GPS点必须由GPS向量从WGS-84坐标溢出得到。从网格坐标溢出的GPS向量不能用于定义GPS点。

选择或指定点列表中的点时，系统检查各GPS点确实由GPS得到，且各网格点不由GPS得到。

校正点对的位置在图形窗口突出显示，在GPS点上有一个框符号，在控制点上有一个十字符号，并有一条直线连接两个位置。需要缩小校正点对中的一个来查看此详细信息。点列表中当前校正点对的符号和连接线用虚线显示。

一般来说，用填充域从图形窗口选出合适的点，来进行校正点对的选择。填充域只将由GPS得到的点选择为GPS点，不由GPS得到的点选择为网格点。也可输入要用于GPS点和网格点域的点名。

如果GPS点使用了网格高程(不是由GPS高度和大地水准面模型得到)，则可在GPS点和网格点中使用同一点。如果进行此操作，类型域被设置为垂直。

注：如果同一名称有两个不同的点(一个GPS点和一个网格点)，选择GPS点时，同名的网格点自动被选择。如果GPS和网格坐标保存在同一点下，需要根据类型区分点。

如果数据库中没有恰当的网格控制点或GPS点，则可在域中给这样的点指定恰当的坐标值。此时，不必指定点的点名，因为Trimble Geomatics Office规定了数据库中的点名。用此方式输入的定位值不保存到数据库中。

要指定校正的坐标值(GPS或网格点)：

点名称域中GPS点或网格点旁边的加号(+)图标。

树形图展开，显示坐标域。

使用填充域或用键盘输入值完成坐标域。

如果在GPS点校正中不选择GPS点，参见主题选择GPS点校正的有关问题。

类型

要指定校正点对在校正计算中的使用方式，用此域。选择坐标组时，Trimble Geomatics Office自动用恰当类型填充此域。如果所选的项有效，可改变其类型。例如，如果控制点没有高程，不能将该组的类型域设为水平和垂直。

相应的选项为：

  水平和垂直 - 此选项指定校正点对在确定水平和垂直平差时适用。

  水平 - 此选项指定校正点对只能用于确定水平平差。网格点的高程值不可靠。

  垂直 - 此选项指定校正点对只能用于确定垂直平差。网格点的纵横坐标值不可靠。

  (忽略) - 此选项指定校正点对不用于任何转换参数的计算。当发现校正计算中存在问题并试图确定有疑问的校正点对时，此选项是有用的。也可使用此设置将校正点对从计算中暂时删除，查看结果是否有所改善。

  (无效) - 此选项显示所选点对是无效点对。

统计

此组中的域显示基于添加到点列表中的校正值的结果。使用综合信息检查校正统计数，在接受眯列表之前识别无效的点对。

水平平差比例因子

水平平差比例因子域显示计算出的水平平差的比例因子。如果选择将比例因子设为1选项框，则此域显示为 �一�。用此域确认计算出的比例因子接近一。如果不接近1，则表明一个或多个校正点对存在问题。

最大垂直平差倾斜度

最大垂直平差倾斜度域在计算出的坡度北向和东向值的基础上，显示计算出的高度平差的最大倾斜度。

最大水平残差和最大垂直残差

最大水平残差和最大垂直残差域显示最大残差值。

插入

点击插入插入空的点校正对记录。在使用缺省投影，且要更新投影原点时这是有用的。第一个点对用于更新原点，因此用此按钮在列表顶端插入新的空校正点对。

删除

点击删除将校正点对从列表中删除。


选择用于GPS点校正的点的有关问题

如果使用GPS点校正-点列表对话框选择GPS点校正的点，系统不允许您选择点校正对的GPS点或网格点：

不能选择GPS点，因为从点由网格得到。

该点是“从点”由网格位置得来的向量结果。如果在实时动态（RTK）测量后，键入了基准站的网格位置，会发生此种情况。任何从基准站溢出的向量都被应用。但是，这些点的位置由WGS-84值（向量）和网格值（基准WGS-84位置）联合得到。不能使用带有从基准站溢出的向量的点。下图对此进行显示：

  点1不能用作GPS点校正中的GPS点。

基准站网格位置被转换到WGS-84，然后向量被用于定位点1。

  点1可用作GPS点校正中的GPS点。

向量被应用到基准站WGS-84位置，来确定点1的位置。

要进行此操作，使用属性窗口编辑点的坐标，并输入WGS-84位置。这将优先使用在网格位置中，从基准站溢出的所有向量都可用作GPS点校正中的GPS点。

与从点由网格位置得到时不能选择GPS点相同，如果从点由GPS位置得到也不能使用网格点。网格点必须从地形观测值溢出。


三参数转换

如果没有定义坐标系统，并想创建自己的投影区域坐标转换参数，用GPS点校正来定义基准转换。

三参数转换法则计算从WGS-84椭球的中心到地方投影椭球的中心沿X，Y和Z Cartesian轴的平移值。控制点位置用于确定地方椭球的空间定位，及与WGS-84椭球的关系。


七参数转换

如果没有定义坐标系统，并想创建自己的投影区域坐标转换参数，用GPS点校正定义基准转换。

七参数转换法则计算三个平移值，三个旋转值和WGS-84椭球和地方投影椭球之间的比例改变值。三个平移值与三参数转换相同，从WGS-84椭球的中心到地方投影椭球的中心沿X，Y和Z Cartesian轴进行计算。它计算两椭球之间各轴的旋转，及允许两椭球之间任何尺寸差值的比例(根据不同的椭球长半轴和扁率值)。

控制点位置用于确定地方椭球的空间定位，及与WGS-84椭球的关系。计算出的平移和旋转值关系非常接近（即如地球半径等非常大的半径中非常小的旋转角度结果近似于平移）。这表明如果控制点不能覆盖足够大的区域，很容易用不太精确的非常大的补偿计算值作为结束。一般来说，除了控制点覆盖的范围大约为八十乘八十公里的情况，其它都不应计算七参数转换。另外计算出的旋转值不应超过10"弧度。


GPS观测值 - 概述

 也请参见

GPS观测值或基线是用GPS观测的两点之间的向量。用于确定基线的两点取决于所用的测量技术。例如，在实时动态 (RTK)测量或事后动态(PPK)测量中，基线从基准站到各流动站的点。

但是，对于快速和快速静态测量，无基准站。用这些测量技术，GPS向量存在于同时观测的点之间，如下表所示：

要浏览基线类型，选择它并打开属性窗口。

静态，快速静态和事后动态(PPK)向量

静态，快速静态和非事后处理的PPK观测值，是未处理的基线。基线已被事后处理后，它们变为事后处理基线。

删除事后处理基线时，基线将回复到潜在基线。可通过删除点来删除基线。或者，如果不想在今后的测量计算中使用它但仍要保持这些点，则取消该基线。

PPK连续向量

事后处理PPK连续向量后，它们以与PPK基线相同的颜色显示，但在属性窗口中的域方法显示为 '连续'。

RTK向量

RTK向量不能是潜在的基线，在属性窗口中显示为 'RTK基线'。连续RTK向量以与RTK基线相同的颜色显示，但属性窗口中的域方法显示为'连续'。

检核向量

如果基线状态设置为'检核'，则基线将以折线显示。

取消的向量

如果基线状态设置为'取消'，则基线将以与取消的基线相同的颜色显示。


GPS观测值

每次用GPS观测点时，创建GPS观测记录。

要用属性窗口浏览GPS观测记录：

1.	选择以下几项：

  用GPS观测点

  基线(在测量视图中)

2.	点击 [image] 图标浏览GPS观测记录。

如果选择在属性窗口中用GPS观测点，可浏览该点的所有GPS观测记录。如果用属性窗口选择基线，可浏览产生基线的GPS观测值。

GPS观测记录包括：

  点名称。

  观测长度（时间）和起始时间。

  包括天线高，类型和方法的GPS天线信息。

在数据导入时，起始和结束时间从GPS时间转换为UTC (世界协调时-通常为Greenwich平均时间)。然后用Microsoft Windows中的当前时区设置显示时间。


棱镜常量

棱镱常量是用全站仪测得的斜距的改正数。在重新计算时使用。它是必要的，因为棱镜反射面不是在测量点的正上方。常量通常为负值。

其中：

	为改正的斜距
	为测量的斜距
	为棱镜常量

棱镜常量值用目标设置信息保存。

要浏览和编辑棱镜常量值：

1.	选择目标设置点或常规观测值。

2.	打开属性窗口。点击 [image] 按钮。

注：在3300/3600/5600 Elta和3600/5600 GDM软件中，棱镜常数在仪器中应用，但不存储在文件里。棱镜常数被显示为‘?’。

如果仪器设置了不正确的棱镜常数，你想在Trimble Geomatics中改正其值，那么，在属性窗口的棱镜常数域中，输入不正确的棱镜常数和正确的棱镜常数之间的差值。例如，如果输入的棱镜常数是“20”，而应该输入的值是“5”，那么输入一个“-15”。

提示： 可使用多重编辑对话框编辑多个观测值。


电子测距仪(EDM)安装电流改正数

大多数现代全站仪不需要安装电流改正数，因为电子测距仪 (EDM)的测量路径符合望远镱的视线。如果望远镜安装的EDM与斜反射面一起使用，反射面/目标可与EDM/望远镜设置匹配时，不需要此改正数。

但是，在某些情况下，需要计算斜距的改正值，来确定观测到的真斜距的EDM测量路径与望远镜视线相符。安装电流改正数取决于安装的系统类型，由Trimble Geomatics Office用下列的相应公式自动应用。

相应的差值保存在设备文件的仪器记录中。

1. 带有非倾斜反射面的标准安装的EDM。

其中：

	为改正的斜距
	为EDM差值(仪器)
	为反射面差值(目标)
	为天顶垂直角度(观测的)
	为测量的斜距(应用棱镜常量改正数之后)

2. 带有非倾斜反射面的安装望远镜的EDM。

其中：

	为改正的斜距
	为EDM差值(仪器)
	为反射面差值(目标)
	为天顶垂直角度(观测的)
	为测量的斜距
此改正数在导入设备文件时应用。


压力和温度改正数
压力和温度改正

压力和温度改正数用于电子测量距离，对通过温度和压力测得的长度变化进行改正。可在外业时输入恰当的值或在导入之前编辑设备文件。

EDM进行的电子测距基于通过空气的光速。温度和压力将影响此速度。

如果EDM没有应用相应的改正数，此大气改正数只用于测距。

其中：

	为改正的斜距
	为测量的斜距
	为EDM仪器的载波和模块频率的一组预设折射指数
	为EDM仪器的载波波长常量(mm Hg)
	为以毫米汞柱表示的大气压力
	为以摄氏度表示的干空气温度
注： Trimble建议您在Trimble Survey Controller中记录压力和温度。当导入.dc文件时，本改正应用到斜坡距离。

注：在3600/5600 Zeiss Elta、3600/5600 GDM和TDS Survey Pro 软件中，压力和温度改正应用在仪器中。因此，在导入到Trimble Geomatics Office中之前，观测值已经被改正。


垂直视准

垂直视准改正是直接用于垂直角度的角度改正值。

仪器的垂直视准通过用仪器的两个盘面对目标进行仔细观测来进行。改正值表明由于望远镜的十字丝的微小不正确定位产生的常量误差。

当仪器视准误差已经建立时，将有视准记录保存在数据采集器文件中，垂直视准被应用到以下所有垂直角度：

盘 1:
盘 2:
其中：

	为改正的垂直角度
	为观测的垂直角度(天顶角)
	为垂直视准改正数。此改正数据在导入设备文件时被应用。
注: Trimble Survey Controller 没有视准程序，在导入期间没有视准改正。

注: 在3300/3600/5600 Elta、3600/5600 GDM和TDS Survey Pro软件中，垂直视准在导入到Trimble Geomatics Office之前被应用。


曲率和折射率

曲率和折射率改正用于观测的垂直角度，允许地球曲率的影响和光路径的大气垂直折射率。

曲率和折射率改正数在导入数据采集器文件时被应用。

其中：

	为改正的天顶垂直角度
	为观测的天顶垂直角度
	为改正的斜距
	为折射系数-通常为0.142或0.20，取决于数据采集器文件中任务记录的值
	为地球半径
注:

  此格式返回弧度值。

  在Trimble Survey Controller文件导入期间应用曲率和折射改正。

  在3300/3600/5600 Elta软件中，曲率和折射应用在仪器中。因此，观测值已经在被导入到Trimble Geomatics Office之前被改正。

  在3600/5600GDM软件中，曲率和折射应用到已计算的坐标上。原始观测值在Trimble Geomatics Office中被导入和改正。

  在TDS Survey Pro软件中，曲率和折射改正在导入到Trimble Geomatics Office时被应用。


水平视准

注：Trimble Survey Controller没有视准程序，在导入时不进行视准改正。

如果遇到视准记录，Trimble Geomatics Office根据下式应用水平视准：

Face 1:
Face 2:
其中：

	为改正的水平角度
	为观测的水平角度
	为水平视准改正数

需要时，在导入设备文件时应用视准改正数。

注: 在3300/3600/5600 Elta、3600/5600 GDM和TDS Survey Pro软件中，水平视准在导入到Trimble Geomatics Office之前被应用。


水平方向

 也可参见

地形水平角度通过用后视点方位角在重新计算时确定方向。水平角度被添加到方位角，结果为前视点方位角。这确定了设置中所有观测值的方向。

后视点方位角用以下规则(只对常规观测值)确定：

  如果只知道仪器位置和后视点， (即无键入的方位角)，重新计算时用由两点间反算值确定的后视方位角。

  如果只有键入的方位角可用，至点没有坐标，则重新计算时将它作为后视方位角使用。

  如果仪器点位置和后视点已知，键入的方位角可用，重新计算确定各方位角的质量，并用下表中的层次确定将哪个方位角作为后视方位角。

例如，如果测量性质的仪器和后视点对存在，键入的方位角能和控制性质的键入方位角一起用作后视方位角。

注： 要计算后视方位角的质量，检查仪器点和后视点的水平质量，并剔除低质量的点。例如，如果仪器点具有控制性质，后视点具有绘图性质，后视方位角将具有绘图性质。

类型	性质
由坐标得到	控制
键入方位角	控制
由坐标得到	测量
键入方位角	测量
由坐标得到	绘图
键入方位角	绘图
注：如果重新计算时要优先使用键入方位角，然后再使用仪器和后视点确定的方位角，需增加键入方位角位置的质量，使其比仪器和后视点确定的方位角层次高一些。

提示： 键入方位角的质量可被编辑。


水平角

 也可参见

对于地形观测值，Trimble Geomatics Office保存两点间无方向的水平角度。角度的方向在重新计算时确定。

导入时，水平角由下式确定：

其中：:

	为Trimble Geomatics Office中保存的水平角
	前视点水平观测值
	后视点水平观测值
BSObs 值保存在设备文件的BKB记录中。(BKB记录是后视记录的.dc文件中的记录类型。)

如果没有后视方向记录，Trimble Geomatics Office将第一点作为后视方向点观测。


坡度化算

 概述

对于各地形观测值，Trimble Geomatics Office在重新计算时将斜距化算为水平和垂直分量。

用以下两公式：

其中：

	为在来源点高程的水平距离
	为来源点和目标点之间的高差
	为斜距(在观测值改正之后)
	为垂直角度(天顶)
参见化算表。表中给出了上述两公式中使用的值。


椭球面改正

海水面改正(或椭球面改正)用于计算水平距离。要查看是否应用了海水面改正，选择文件/项目属性/一般标签 。

此改正数将水平距离化算到在椭球面测量的距离（不是大地水准面，而是海水面）。此差值在化算中不明显。

如果选择了椭球面改正框，地形观测值应用到地方椭球。如果清除椭球面改正框，地形观测值应用到地面。

椭球面改正公式为：

其中：

	为地球半径

参见化算表。表中给出了上述两公式中使用的值。

注：椭球面改正不应用在比例因子唯一任务中。当导入比例因子唯一的文件时，Trimble Geomatics Office中的椭球面改正被自动关闭，除非选择了地方站点设置对话框中的使用地面坐标选项框。


地球半径

在Trimble Geomatics Office中，地球半径用投影纬度和投影椭球计算。如果未确定项目的投影纬度，则使用30度的缺省纬度。例如，在WGS-84椭球上，投影纬度为30度时，则地球半径值为6383 480.917。

注： 在导入地形观测值之前定义投影纬度。如果在导入地形数据之后定义投影纬度，使用新计算的地球半径时，椭球改正数，曲率，折射率改正数都不会再次应用。

要定义投影纬度：

1.	选择文件/项目属性。出现项目属性对话框。

2.	选择坐标系统标签。

3.	在地方站点设置组，点击改变。

4.	在投影位置组，输入投影纬度。


常规观测值 - 概述

Trimble Geomatics Office支持用常规测量仪器观测的点。这些点称为常规观测值。

在Trimble Geomatics Office中可以：

  导入常规观测值

  导入激光测距观测值

  导入数字水准仪文件


常规观测值化算

Trimble Geomatics Office的重新计算使用测量距离和观测角度计算常规观测点的坐标。

导入

文件导入时，应用以下改正：

  压力和温度改正，应用到斜距。

  曲率和折射率，应用到垂直角度。

  水平角度，将水平观测值化算到从后视点的水平角。盘2的读数作为盘1的读数保存。

  电子测距仪(EDM)安装电流改正。

  水平视准(只对.sdr 文件)。

  垂直视准(只对.sdr 文件)。

重新计算

在重新计算时，应用以下改正：

  椭球改正

  水平方向

  棱镜常量


化算表

在这些改正数中，下表给出了公式中所用的值：

其中：

	为垂直角度(天顶)
	为斜距(观测值改正之后)
	为来源点的椭球高程
	为来源点和目标点的高度差
	为在来源点高程的水平距离
	为海水面(或椭球面)弦
	为海水面(椭球)距离


常规观测值 - 两个盘的观测值

盘2观测值被转换为盘1观测值，并保存在数据库中。要选择观测值，使用属性窗口。盘（1或2）被显示。

如果有从和到同一点的盘1和盘2观测值，则将其平均，作为一个观测值导入。观测类型显示为平均。


常规观测值 - 导线

用Trimble Survey Controller、TDS Survey Pro或3600/5600 Elta软件可计算常规观测值的导线闭合差，并将导线平差。

如果已将导线平差，并想改变平差值，则按以下步骤进行：

1.	选择要改变坐标的点。

2.	打开属性窗口，用树形结构展开点。

3.	检查点是否已有了网格/地方坐标。如果没有，用添加坐标按钮 [image] 添加一个坐标。

4.	点击坐标域并输入已知的坐标值。

5.	在坐标域旁边的性质选择控制按钮的下拉菜单中选择性质选项。性质必须为测量或更高质量，以便优先于观测值使用。

6.	点击确定。

7.	按F4重新计算测量数据。

重新计算确定已知坐标和观测坐标之间的闭合差。

闭合差显示在重新计算报告中。如果不想看到闭合差，可取消观测值。

要浏览闭合差，有以下几种方法：

  选择报告/重新计算报告。

  点击属性窗口的警告页按钮，再点击点来源图标 [image] 。

  点击属性窗口的综合信息页按钮，再点击点来源图标 [image] 。


激光测距观测值 - 概述

Trimble Geomatics Office的Trimble Survey Controller版本7.00或更高版本支持用激光测距仪观测的点。关于Trimble Survey Controller支持的激光测距仪的信息，参见Trimble Survey Controller参考手册。

激光测距观测值显示的方法取决于属性窗口听外观设置。

在Trimble Geomatics Office可以：

  导入包含激光测距观测值的Survey Controller (*.dc)文件。 (观测的激光测距点与常规点一样被导入到Trimble Geomatics Office。)

  在属性窗口浏览激光测距观测值。

  选择和报告 激光测距观测值。


    激光测距观测值 - 浏览

激光测距观测值在测量视图中显示。显示的颜色取决于视图/选项/测量图例标签的背景设置。

提示： 选择 选择/通过查询，用激光测距点选项选择数据库中的所有激光测距点。激光测距点带有激光测距观测值。

要浏览用激光测距仪观测的点：

1.	在测量视图中打开属性窗口。

2.	选择激光测距观测值 主菜单。

用菜单按钮浏览以下激光测距观测值详细信息：


校正和平差转换参数

 帮助 ...

当进行GPS点校正时，计算校正参数来建立数据库中的WGS-84点(GPS点)与地方网格位置的关系。

当进行约束网平差(如果安装了网平差模块)，则计算转换参数。这些参数建立了观测值和固定控制之间的关系。

Trimble Geomatics Office只允许由GPS点校正得到的水平和垂直平差参数或由由平差得到的平差转换参数。如果进行了平差并计算了平差转换参数，然后要进行GPS点校正，系统将警告您如果继续进行校正，参数将被删除。

注： 不能将由平差得到的平差转换参数传送到Trimble Survey Controller。要进行此操作，需要使用保存过的在WGS基准上由平差得到的校正坐标 (WGS-84点)和在地方基准上由约束网平差得到的平差坐标 (网格点)来进行GPS点校正。


参考资料

书籍：

Barry, B. Austin. 1991. 测量、工程和技术中的实际度量误差（Errors in Practical Measurement in Surveying, Engineering, and Technology）. Edited by M. D. Morris. ISBN�0-910845-47-6. Rancho Cordova: Landmark Enterprises.

Hofmann-Wellenhof, B., Herbert Lichtenegger, and James Collins. 1993. 全球定位系统理论和实践（Global Positioning System Theory and Practice）第二板. ISBN:�3-211-82477-4 and ISBN�0-387-82477-4. New York: Springer-Verlag Wien.

Leick, Alfred. 1995. GPS 卫星测量（GPS Satellite Surveying）. 第二板. ISBN: 0-471-30626-6. New York: John Wiley and Sons, Inc.

Pope, Allen J. 1976. 残差统计和离层探测（The Statistics of Residuals and the Detection of Outliers）. NOAA Technical Report NOS65 NGS1, Rockville, MD.

Seeber, G黱ter. 1993. 卫星大地测量学，基础、方法和应用（Satellite Geodesy, Foundations, Methods, and Applications）. ISBN:�3-11-012753-9. Berlin and New燳ork: Walter deGruyter.

U.S. National Geodetic Survey (NGS). 1986. 大地测量学术语（Geodetic Glossary）. Silver Spring, MD: NGS Publications Information Center.

Van燬ickle, Jan. 1996. 陆地测量员GPS（GPS for Land Surveyors）. ISBN 1-575-04041-7. Ann燗rbor: Ann燗rbor Press, Inc.

Wolf, Paul R. and Charles D. Ghilani. 1997. 平差计算：在测量和 GIS 中的统计和最小平方（Adjustment Computations: Statistics and Least Squares in Surveying and GIS）. ISBN: 0471-16833-5. New York: John Wiley and Sons, Inc.

其它来源 � 美国出版物 / 杂志：

下列刊物是关于测量民用工程和测量在其它方面的有用信息来源：

ACSM 学报（ACSM Bulletin）. ISSN: 0747-9417. Published bimonthly by the American Congress on Surveying and Mapping, 5410 Grosvenor Land, Suite 100, Bethesda, MD 20814-2144 USA.

GPS 世界：全球定位系统的进展和应用（GPS World: News and Applications of the Global Positioning System）. ISSN: 1048-5104.Published monthly by Advanstar Communications Inc. Subscription offices: P.O. Box 6148, Duluth, MN 55806-6148 USA.

P.O.B. � 点的开端（P.O.B. - Point of Beginning）. ISSN: 0739-3865. Published monthly by Business News Publishing Company, 755 W. Big Beaver Road, Ste. 1000, Troy, MI 48084 USA.

专家测量员（Professional Surveyor）. ISSN: 0278-1425. Published ten times a year by Professional Surveyors Publishing Company, Inc., 1713-J Rosemont Avenue, Frederick, MD 21702-4170 USA.


缩放浏览器

缩放浏览器出现在项目栏底部的小窗口。它反映了在Trimble Geomatics Office图形主窗口显示的数据。如果使用主窗口的任何缩放工具，缩放浏览器会发生改变来反映您的使用情况。它总是显示项目的范围。

隐藏 (或显示)缩放浏览器

要在Trimble Geomatics Office栏中隐藏(或显示)缩放浏览器：

1.	在项目栏，点击鼠标右键访问快捷菜单。

2.	选择缩放浏览器。

使用缩放浏览器

要使用缩放浏览器：

  点击缩放浏览器的项目区域。

注： 这一区域成为图形主窗口的中心。

要使用缩放浏览器进行缩放：

1.	在缩放浏览器中沿要选定的区域拖放一个框。

图形主窗口显示同样数据。

2.	当指向缩放浏览器框的中间时，指针变为 [image] 。 这表明可沿项目区域，不改变缩放比例，而拖放一个框。图形主窗口的项目视图反映了这些移动。

 要缩放到项目的范围，双击缩放浏览器。

注： 如果鼠标带有轮，可使用轮改变缩放浏览器框的尺寸。


项目栏 - 综述
项目栏 - 概述

项目栏由Trimble Geomatics Office中一组已命名的列出常用任务的快捷图标组成。每个快捷图标用于一个菜单。

要快速访问一个任务：

1.	点击项目栏的快捷图标。

2.	点击一个组，移动到另一组快捷图标。

要改变快捷图标的尺寸：

1.	在项目栏区域点击鼠标右键。

快捷菜单出现。

2.	选择大图标或小图标选项。

要隐藏 (或显示) 项目栏，有以下几种方法：

  在项目栏区域点击鼠标右键。

快捷菜单出现。选择隐藏。

  选择视图/项目栏。

在工具栏中，点击项目栏图标。

没有打开项目时，项目和功能组可以用。打开项目后，所有组的整个列表（除了功能组外）都变为有效：

  Trimble测量组

  项目组

  导入组

  处理组(如果安装了Trimble WAVE 基线处理模块)

  平差组(如果安装了Trimble 网平差模块)

  导出组

  CAD组

  程序组


项目栏 - Trimble测量组

Trimble测量组包含可在测量视图中快速访问任务的快捷图标。这些快捷图标以常用的顺序列表如下。


项目栏 - 项目组

项目组包含快速访问项目命令的快捷图标。


项目栏 - 导入组

导入组包含可快速访问从常用测量数据源导入数据功能的快捷图标。


项目栏 - 处理组

处理组包含可快速访问常用基线处理任务的快捷图标。

注： 必须安装基线处理模块。


项目栏 - 平差组

平差组包含可快速访问常用平差任务的快捷图标。

注： 必须安装网平差模块。


项目栏 - 导出组

导出组包含可快速访问将项目中数据导出到常用数据格式功能的快捷图标。


项目栏 - CAD组

CAD组包含可快速访问平面视图中的常用任务的快捷图标。


项目栏 - 功能组
项目栏 � 功能组

功能组包含可快速访问Trimble Geomatics Office系统中常用程序的快捷图标。


属性 - 概述

更多信息

如何做 ...	对话框	也请参见
概述

属性是关于要素代码的一条描述信息。例如，对于要素代码 'tree'，属性可以有种类、高度、周长和状态。在野外采集的每个 'tree'要素代码都有各自的属性值。

Trimble Geomatics Office支持带有点的属性信息管理。用Trimble Geomatics Office可以：

  使用Trimble要素和属性编辑器� 程序创建含有属性定义的要素和属性库

  导入包含属性的测量控制器 (*.dc)文件

  查看和编辑属性信息

  添加属性

  将数据导出到地理信息系统 (GIS)格式

  产生属性报告

用要素和属性编辑器程序定义要素代码的一组属性。对于每个属性必须定义属性名称和类型。 属性类型决定属性信息的格式。例如，如果 'tree' 的属性为高度，属性类型就是 '数值'。

也可用数据字典(*.ddf)文件采集属性信息。要创建 .ddf文件，使用Trimble数据字典编辑器�程序。它是GPS Pathfinder� Office软件的一部分。

工作流程

Trimble Geomatics Office管理属性信息的工作流程为：

1.	在要素和属性编辑器中，创建要素和属性库 (*.fcl)文件。

2.	在Trimble Geomatics Office中，选择.fcl或.ddf文件建立属性项目。

3.   将 .fcl 或 .ddf 传输到Trimble Survey Controller (版本 7.00或更高版本)。

4.	在野外采集数据。

5.	将野外数据传输到Trimble Geomatics Office。

6.	将GIS或自定义ascii格式的数据导出。


要素和属性库 - 概述

更多信息

 如何做 ...

概述

要素和属性库 (*.fcl) 文件是包含要素代码定义、属性、CAD方式和控制码的文本文件。要编辑要素和属性库，使用Trimble 的要素和属性编辑器�程序。

要素和属性库是描述处理要素代码时所需操作的一组指令。例如：

  将指定的点形式分配给点

  创建点间的线

  定义要在野外采集的属性

  注释点和线

关于要素和属性库的更多信息，参见Trimble要素和属性编辑器的帮助。

使用要素和属性库文件 (*.fcl) 可以：

  处理要素代码

  定义要在野外采集的属性

要素代码处理

关于使用要素和属性库处理要素代码的信息，见主题要素代码 � 概述。

属性

要建立属性项目，使用项目属性对话框。可选择要素和属性库 (*.fcl)文件或数据字典(*ddf)文件。


建立属性项目

 概述及更多信息

要使用Trimble Geomatics Office中的属性，必须给属性建立一个项目。方法是选择要使用的要素和属性库(*.fcl) 或 数据字典 (*.ddf)文件。

提示： 对于怎样选择 .fcl or .ddf 文件的信息，见主题建立属性项目。

Trimble Geomatics Office给带有属性的每个要素创建一个表。 库文件不保存在项目中。这就是说如果对库进行了改动，项目不会被更新。

改变项目的要素和属性库

要改变项目的要素和属性库，根据上述方法来选择。但是，在以下操作进行之后，Trimble Geomatics Office就不允许进行这项改变：

  插入了包含属性的Survey Controller (*.dc)文件

  在Trimble Geomatics Office中添加了属性记录

这是因为已有的要素表被删除，新表已被所选库创建。

如果非常需要改变项目的要素和属性库，可删除带有属性的所有点，重新打开项目，然后选择新的要素和属性库。

Trimble Survey Controller

要确定Trimble Geomatics Office 中使用的要素和属性库（或数据字典文件）与野外使用的Trimble Survey Controller 中的库相同。如果使用了不同的库，有些属性数据可能无法导入。

关于使用不同的库时导入带属性数据的信息，参见导入带有不同定义的属性。


数据字典文件 - 概述

更多信息

 也请参见

概述

数据字典文件是定义要素和相关属性的文件。

它可以作为要素和属性库的替代文件。

如果有数据字典编辑器程序 (它是GPS Pathfinder Office的一部分)，就可用它创建数据字典 (*.ddf)文件。.ddf文件包含要素和属性的定义。

使用.ddf文件建立属性项目

可以使用.ddf 文件建立属性的Trimble Geomatics Office项目。此时，.ddf 文件中的任何线或面要素都被作为点要素看待。这是因为Trimble Geomatics Office和Trimble Survey Controller（版本7.00或更高）只支持点要素。

使用要素和属性编辑器中的.ddf文件

注： 用于建立属性项目的要素和属性库不必与处理要素代码时的要素和属性库相同。但是，如果在野外用要素和属性库文件采集属性数据，就应使用与处理要素代码时相同的库。

可使用要素和属性编辑器程序将.ddf文件导入要素和属性库。也可将.fcl文件作为.ddf文件导出。如果想要用数据字典编辑器程序中的.ddf文件，这一步骤是非常有用的。

使用Trimble Survey Controller中的.ddf文件

在野外用库定义属性时，可使用.ddf 文件。方法是，将.ddf文件传输到Timble Survey Controller。


导入带有不同定义的属性

 概述及更多信息

在导入含有属性的测量控制器(*.dc)文件时，将.dc文件中的属性定义与项目中的属性定义进行比较。如果它们在某一方面不同，就会出现一个对话框，提示您是否要进行以下操作：

  导入两个要素和属性库或数据字典文件中共同的属性信息。

如果选择此项，并在将文件传输到Trimble Survey Controller后，改变项目的要素和属性库文件中的属性定义，就将丢失此要素代码的属性信息。如果只添加新的要素代码，不会丢失数据。

  插入带有要素代码但没有属性信息的点

  取消导入

如果不希望出现此信息，确定用于建立属性项目的文件与Trimble Survey Controller 中使用的文件相同。


在Trimble Geomatics Office中浏览/编辑属性

 概述及更多信息

要浏览和编辑Trimble Geomatics Office中点的属性，使用属性窗口。如果在项目属性对话框中已经建立了属性项目，属性窗口会出现属性标签。如果所选点带有不只一个的含属性要素，使用下拉菜单列表选择要浏览属性的要素。要编辑属性值，点值列中的相应域。

对于菜单属性：

  从相应的属性值列表中选择一个值。

对于其它属性类型：

  用键盘输入属性的新值。不能使用属性的填充域。

注： 在编辑属性信息时，Trimble Geomatics Office检查要素和属性库定义，确定新值是有效的。


在项目间复制/剪切/粘贴带属性的点
在项目之间复制/剪切/粘贴带属性的点

 也请参见

要复制、剪切和粘贴带属性的点，用于建立两个项目的要素和属性库必须相同。

如果要素和属性库不同，但具有共同的属性定义，您将会被提醒，并给出选项来取消粘贴、只粘贴点（不带属性）或粘贴带有两个库共同属性的点。Trimble Geomatics Office在导入.rpt报告中记录未被粘贴的属性。

如果项目已经包含了带属性的点，就不能选择不同的库来建立属性项目。这是因为属性定义已经被设置。但是，可以创建新的项目，在要素和属性库（或数据字典文件）中定义新的属性定义，然后从已有项目将带属性的点复制到新项目。

注： 复制、剪切和粘贴只在符合下列条件时有效：

  被复制或剪切的所有点都带有高程。

  项目指定了缺省的高程。缺省值用于任何带有空高程的点。

这是因为被复制/剪切的点的坐标将被归算到WGS-84椭球。要粘贴到的项目中的坐标系统应适用于要粘贴的点。如果要粘贴到的项目含有不同的坐标系统，将显示正确的坐标。


.fcl文件和.ddf文件的区别

可以使用Trimble Geomatics Office项目中的要素和属性库 (*.fcl)文件或数据字典(*.ddf)文件。要给当前项目选择一个文件，选择文件/项目属性 /要素标签。两个文件之间的区别如下：

.fcl 文件

.fcl文件包含要素编码及属性定义的CAD设置（例如点形式、线形式、注释模板和控制码）。如果选择用.fcl文件建立属性项目，Trimble Geomatics Office使用属性定义创建所需的表。

如果选择将带属性的.fcl文件导出到Trimble Survey Controller（版本7.00或更高），过程也相同。

如果要使用要素代码并采集属性，应使用.fcl文件。如果已经有了.ddf文件，但需要要素代码，应将.ddf文件导入要素和属性编辑器程序中的.fcl文件，然后使用.fcl文件。

更多信息，参见要素和属性编辑器程序帮助。

.ddf文件

.ddf文件不包含要素编码的CAD设置。它只含有要素和属性定义。如果处理来自.ddf文件的要素代码，不会分配点、线或模板形式。

可从数据字典编辑器程序（如果有GPS Pathfinder Office）或从Trimble Geomatics Office中的要素和属性编辑器程序创建.ddf文件。（在要素和属性编辑器中选择文件/导出，导出.ddf文件。）


数据传输 - 概述

Trimble Data Transfer应用程序是一个软件，用来在Trimble Geomatics Office和设备之间传输数据。设备可以是测量控制器、Trimble GPS 接收器、常规全站仪、SDR格式数据控制器、数字水准、控制单元或PC卡。在使用这个数据传输软件之前，要设置所需的设备。

如果有要设置的设备，从Trimble Geomatics Office内部访问数据传输，请进行下列操作：

1．	选择文件 / 导入或文件 / 导出 � 取决于您的需要。相应对话框出现。

2．	选择所需的选项。

要打开数据传输应用程序，则选择一个需要连接到设备的选项。

根据选择，另存为或打开对话框出现。

3．	选择来回传输数据所需的设备。

从项目外面访问数据传输应用程序

如果没有打开的项目，您可以在计算机和设备之间传输文件。

步骤如下：

 从Trimble Geomatics Office选择功能 / 数据传输。

从Trimble Geomatics Office外面访问数据传输应用程序

您可以从Trimble Geomatics Office外面，在计算机和设备之间传输文件。

步骤如下：

 选择开始 / 程序 / 数据传输。


设备 - 概述

为了在Trimble Geomatics Office 项目和设备之间传输数据，需要正确地设置设备。

当此设备设置好后，在导入或导出时总可以使用它。进一步信息，请参考数据传输的帮助。


DAT Checkin 对话框

在导入GPS观测值到Trimble Geomatics Office 项目之前，使用此对话框可以校验和改正GPS文件中的值。

注：在此对话框内所做的任何改动，只影响导入的数据，不影响GPS数据 (*.dat) 文件。

导入时，对话框会出现：

  GPS 数据文件(*.dat)

  RINEX 文件(*.XXo, *.XXn, *.obs,*.nav)

  具有相关.dat 文件的DC文件

使用

如果您不需要数据传输到此项目，清除这个校验框。

名称

显示已观测数据的点名称。如果在文件中没有分配名称给点，就用站点ID 。用键盘键入名称去改变这个域。

文件名

显示数据的文件来源。

开始时间

显示开始时间和观测时间的日期。

停止时间

显示停止时间和观测时间的日期。

接收机类型

列出用来采集数据的GPS 接收器类型。

接收机 S/N

显示接收机序号。您可以编辑这个号码。

天线高度

显示为观测时间输入的天线高度。如果在观测时间内输入的天线高度不正确，则用键盘输入一个值来改变这个域。

天线类型

显示连接到接收器的天线类型。如果在观测时间内输入的天线不正确，则从所列条目中选择一个天线类型来改变这个域。

测量到

显示天线高度测量到的地方。如果在观测时间内输入的方法不正确，则从列表中选择一个选项来改变这个域。

要素代码

显示分配到点的要素代码值。用键盘输入一个新值来改变这个域。

重置

单击重置恢复原始设置。

提示：为了把相同的改变应用到多个点，按住Ctrl键的同时在您想改变的栏目中选择所需的域。如果想选择连续的行，按下Shift键。在已选域里键入或选择一个值，它是您想用到所有域的值。


数字水准导入对话框

 也请参见

使用数字水准导入对话框到：

 显示来自数字水准文件的数据

 决定您想在哪些点之间计算出高程变化量

 证实起始点的高程

 决定已知点上的闭合差误差

 证实点的名称

当导入数字水准文件 (*.dat, *.raw) 时，数字水准导入对话框出现。

步骤如下：

1．选择文件 / 导入。导入对话框出现。

2．在测量标签里，选择数字水准文件 (*.dat, *.raw)。打开对话框出现。

3．选择数字水准文件。

4．数字水准导入对话框出现。

您在此对话框内所作的任何改动只影响导入的数据，而不影响数字水准 (*.dat, *.raw) 文件。

注意：当导入数字水准数据时，可以指定处理重复点的方法。缺省地，Trimble Geomatics Office合并导入的相同名称的点，因而不创建重复点。在重复点选项对话框中，可以用限差选项范围内的合并重复点指定用来合并重复点的垂直限差。导入数字水准数据时，不使用水平限差。

注：可以从DiNi数字水准设备直接导入数据。进行此操作时，数字水准导入对话框出现。

提示：当采集数字水准导入数据时，存储那些您想要导入到Trimble Geomatics Office里的、具有唯一前缀或后缀的点。例如，存储您想用作站点的、具有前缀STN 的所有点。这样可以容易地从数字水准导入对话框里按筛选器选择按钮选择点，或者选择您不想导入的点。

在高程组内，可以查看下列域：

起始点

起始点的名称。在水准值段的起始点是用起始点图标表示的。

高程

起始点的高程。当表格里的点被选中时，您可以编辑起始点的高程。选择表格里另一个水平环，显示高程组内那个环的起始点。一个水平环的结尾和另一个环的开始是用一条粗水平黑线来表示的。

高程质量

高程域质量。改变高程质量，点击质量按钮

下面数字水准表里的数据是以观测值的顺序显示的。您可以查看下列栏目：

栏目	显示什么？
测点	点的名称和此点是否被选为导入到Trimble Geomatics Office测点。导入文件时，所有观测值都被缺省地选择。测点名称可以编辑。
BS	水准观值到后视。
IS	水准观值到中视。直到选择了相应的后视，才可以选择中视。
FS	水准观值到前视。
高程	点的高程。图标用于指示哪个点被用作计算高程的起始点。它对应于显示在高程组内的起始点。 每个环内起始点的高程能从高程组编辑。 如果一个点没有高程，则起始点不能选择来计算点的高程。
距离	到后视、前视、中视的距离。
描述	描述正在置为水平的点。
放样差值	被放样点和点定位设计高度之间的高程偏差。

选择表格里的点，进行下列操作之一：

 在测点栏目里选择校验框。

 单击测点栏目头。单击栏目顶部，可以选择表格里的所有点，然后再选择此栏目的第一个点。

 单击按筛选器选择。

一但指定了一个选择项，则应用下列规则：

 直到前面的后视被选，才可以选择中视。

 如果有一个以上同样名称的视点存在，它将选择所有同样名称的其它观测值（中视除外）。

当单击按筛选器选择时，定义水准测站对话框出现。

注：下列数字水准和存储格式被支持：

注：Trimble Geomatics Office不支持Leica 测量记录，此记录在水准值段以外，是330 记录。


定义水准测站对话框

更多信息

 也请参见

当在数字水准导入对话框里单击按筛选器选择时，定义水准测站对话框出现。用这个筛选器选项可以选择测点或去掉对测点的选择。所有在数字水准导入对话框内的测点都被缺省选择。

提示：当采集数字水准导入数据时，把那些您想导入Trimble Geomatics Office、并具有唯一前缀或后缀的点存储起来。例如，存储您想要用作测点且具有前缀 STN 的所有点。这样可以容易地从数字水准导入对话框里用按筛选器选择按钮选择那些点。

有下列选项：

选择点

用此选项选择数字水准导入对话框测点栏目里的测点。例如，您可以选择具有具体前缀或后缀的测点。

注：任何没有具体前缀或后缀的点都被清除。

取消点

对于特别的点，用此选项清除数字水准导入对话框测点栏目里的校验框。

注：任何没有具体前缀或后缀的点都被校验。

名称

用这个域按名称选择点。可以用 ?, * 或 # 通配符选择点名称。

描述

用此域通过对点的描述选择点。也可以用通配符选择描述。

举例

如果不想在数字水准导入对话框里的测点栏目选择带有前缀 揑S� 的点：

在定义数字水准测点对话框里，选择取消选项。

选择名称选项，键入IS*。


在网平差中使用水准观测值
在网平差里使用水准观测值

如果想用水准数据执行网平差，则必须要有已定义的水准观测值的标准误差。这个软件为下列情况计算标准误差：

 如果导入数字水准数据 ，标准误差（高程变化量）用转数来计算。

 采用Trimble 数据交换格式时，如果在导入格式里包括转数，就要计算标准误差。或者，直接使用文件的标准误差（高程变化量）。

如果标准误差没有被定义，水准观测值就不为平差作标记。

注：您可以为每个高程变化量输入标准误差或转数，输入到属性窗口。


GIS导出失败对话框

如果GIS导出失败，这个对话框便出现。

一些可能的原因列在下列表中：


选择大地水准面模型对话框 - 疑难解答

在导入设备文件过程中，如果文件中的大地水准面模型名称与坐标系统数据库(当前.csd)内的任何大地水准面模型名称不吻合，这个对话框就会出现。选一个您想用的大地水准面模型。

由于下列原因之一，此对话框已经出现：


缺少打印机

如果从Trimble Geomatics Office 打印或绘图，需要在您的计算机上安装打印机。

安装打印机步骤：

1.	点击开始。

2.	选择设置 / 打印机。打印机窗口出现。

3.	双击增设打印机。

按照安装指示在Microsoft Windows设置里增设打印机。打印机安装之后，就可以从Trimble Geomatics Office打印。


选择基准网格模型对话框

如果在已导入文件中的组合基准网格文件名不与任何一个在坐标系统数据库内的基准网格文件相吻合，此对话框就将出现。

用这个对话框挑选最合适的组合基准网格文件，在此系统内使用。

由于下列原因之一，此对话框出现：


关于导入测量控制器 (*.dc) 文件的信息和对话框

当您导入一个测量控制器 (*.dc) 文件到Trimble Geomatics Office时，此软件在文件上要执行一些校验，如果此 .dc 文件和项目的坐标系统不同，它会提醒您。

下面列出的是当导入一个.dc文件时可能出现的一些信息和对话框：

  导入文件时一个或多个错误产生

  为该项目定义要素和属性文件方法不同

  该项目的要素和属性文件还没有被定义

  不能导入文件

  缺省投影定义对话框

  重复点对话框

  项目坐标系统对话框

  选择基准网格对话框

  选择大地水准面对话框


信息 - 导入文件过程中产生一个或多个错误

导入文件过程中，如果软件发现一个或多个错误，采取下列操作之一：

 消除此信息，并忽略错误信息，点击不。

 点击确认。

一个导入报告出现在缺省的HTML查看器中。点击错误信息链路或者滚动查看导入报告的错误部分。

如果必要，纠正错误，重新导入文件。


 信息 - 为该项目定义的要素和属性文件不同

在导入测量控制器 (*.dc )文件的过程中，您会发现要素和属性库或用来建立属性项目的数据词典文件不同于 .dc 文件里所指的。

采取下列操作之一：

 点击确认，导入公共属性到.dc文件和项目。

 点击不，仅导入从 .dc 文件来的点。

为了避免此信息再出现，要确定您所使用的库和您用来在此域采集属性信息的库是相同的。


信息 - 这个项目的要素和属性文件还没有被定义

在导入一个包含属性信息的测量控制器 (*.dc) 文件的过程中， Trimble Geomatics Office有可能找不到要素和属性库或找不到为此项目定义的数据词典文件。

采取下列操作之一：

  点击确认，仅导入测量数据，忽略从.dc文件来的属性信息。

  点击删除，在具有被.dc文件用来作参考的相同库的项目属性对话框/ 要素标签中，给属性建立项目，然后重新导入.dc文件。


信息 - 不能导入文件
不能导入文件

在导入文件的过程中，碰到一个错误，这个错误导致文件不能导入。下列信息出现：

文件 <文件名> 不能被导入。

检查一下文件是否在另一个应用中打开（例如，一个测量控制器 (*.dc) 文件已经在DC File Editor 功能里打开）。不然，此文件可能损坏。


    要素代码 - 概述

更多信息

如何作 ...	对话框	也请参见

概述

要素代码是一种记录点的方法，这些点是为某种处理形式的需要而编到一组的。例如，您可以沿着一条分隔线给每一个采集到的点编码为“FENCE”。这样，在返回到办公室后，所有含有“FENCE”要素代码的点都可以用一种特定的线形式连接在一起。

要应用要素代码，需要：

 创建要素和属性库 (*.fcl) 文件

 传输库到 Trimble Survey Controller

  传输库到TDS Survey Pro

 用库中的要素代码采集数据

 传输测量控制器 (*.dc) 文件到 Trimble Geomatics Office

 处理要素代码

一个要素和属性库是一个指令集：

如果要创建新库，使用要素和属性编辑器程序。您可以根据需要创建任意多个库。在要素代码被处理时，库中的指令就会告诉Trimble Geomatics Office 如何处理选项中的数据。当一个要素代码域中的值与要素和属性库里的指定条件匹配时，相关的操作就会被执行。

有关要素和属性库的更多的信息，请查看要素和属性编辑器的帮助。


    要素代码 - 处理顺序

 概述及更多信息

当前选择中的所有要素代码都要被处理，但是您使用的选择方式决定了处理的顺序。

选择集

在一个测量控制器 (*.dc) 文件被导入时，相应的选择集就被创建了。它和 .dc 文件使用一样的名称，并且以域中点的采集顺序来记录。如果您使用这个选择集，处理要素代码就会以采集它们的顺序进行。

其它选择方法

您也可以按照下列操作方法之一进行：

  从选择菜单选择一个命令。

  点击一个点。

如果使用这些方法，则处理可能不会出现在采集数据的顺序中。


    要素代码 - 常见错误

 概述及更多信息

以下是在您使用要素代码时会发生的一些典型的错误。

不正确连接是由于使用了错误的选择集

比起使用导入数据时系统创建的选择集，不正确的连接在使用图形选择(或选择 / 全部 命令)为要素编码选取点时更有可能发生。

注：从一个文件导入的所有元素都被保存在一个选择集中。在测量控制器 (*.dc) 文件情况下，选择集是根据文件里内部任务的名称来命名的。也就是说，创建的选择集保持着导入点的顺序。在 .dc 文件情况下，这就意味着选择集保持着测量工作进行的顺序。要素代码处理通常都这样要求。

控制代码被放置在错误的点代码旁

例如：CURB1 LP ST

这里的点是控制线上的一个灯杆的观测点。控制观测点是新的控制线的起点。灯杆是一个要被标记适当符号的点。ST（Start）命令应用于它跟随的那个点代码（这里就是灯杆）。这意味着这条线是从最后那个标记着CURB1的点起画到当前的这一点，但这并不是编码的真正意图。

编码应该是：CURB1 ST LP 或 LP CURB1 ST

使用ST（Start）命令失败

它会造成相同代码的点之间的连续线被画到错误的地方。


域代码 - 概述

更多信息

 帮助 ...

概述

域代码是告知Trimble Geomatics Office将插入域的特殊指令。还可以用域代码以ASCII导入/导出或自定义报告操作来进行数据库数据的传送。域代码用不同的标题进行分组。关于各标题及各域代码详细信息的链接，参见域代码详细信息。

Trimble Geomatics Office使用域代码非常广泛。例如，域代码可用在：

  创建新项目时的项目名称和项目标题中的日期

  注释

  标签

  自定义点标签

  ASCII导入/导出

  报告定义

域代码通常包含在括号中。'[]'中的任何字符都作为可能的域代码表达式，如果有域代码值，表达式可被相应的域代码值代替。

例如，可以命令Trimble Geomatics Office用域代码'[Name]'给数据库中的各点定制点名标签。可以通过添加域代码'[Elevation]'，将高程包括在标签中。

例如，相应设置[$Coordinate System.Zone] 可显示擟alifornia Zone 3 0403�，[Feature Code] 可显示擳REE�。其它信息如当前计算机系统日期和时间可用[Date] 和[Time] 域代码进行输出。

进一步举例，域代码Name=[Name] Elv=[Elevation] 可产生下列报告类型：

Name=3397 Elv=18.762

Name=3396 Elv=18.702

Name=3432 Elv=?

Name=3436 Elv=16.372

要访问域代码，在要添加域代码的域中右击。如果域代码有效，快捷菜单中出现域选项。

句法

域代码的句法包括三个元素：

[context.name:options]

使用 context 元素消除域代码名称中任何模糊的因素。 例如，域代码[Name]通常显示数据库中当前点的点名称。如果要用域代码显示项目，必须包括上下文$Project (即，需要[$Project.Name])。否则，返回当前点名。

context元素是可选的。如果省略，则Trimble Geomatics Office假定一个最符合逻辑的上下文。

域代码中包含的选项 通常是域代码的补充成分。这一元素也是可选的。


域代码详细信息

 概述和更多信息

域代码可用几个标题进行分组：


数据库域代码

  概述和更多信息

数据库域代码从数据库直接输出保存和计算的值。可选择在数据库域代码之前加上数据来源的表的名称。

例如， [Point.easting]从点表格中提取横坐标值。只要表格是带有横坐标域的唯一表格，简单指定的[Easting]也从点表格中提取横坐标值。如果有可能出现模糊不清，则表的名称应该被指定。

有效的域代码是上下文相关的。有效名称取决于上下文，但一般来说，与数据库表格相关的域代码为：

数据库域代码

数据库中域的值直接从数据库得到（如，横坐标）。

计算的域代码

下表显示计算的有效域代码：

$Center{<separator>} (alternatively, $Centre{<separator>})

对于一段弧，有一个特定的域代码$Center (或$Centre) 显示中心点名称（如果使用数据库中的点）或中心点坐标。

可在坐标值间指定分隔符进行显示。如果省略分隔符，则使用Microsoft Windows 控制面板/区域设置中的'列表分隔符。

第一坐标

第一坐标（横坐标或纵坐标）值取决于输出顺序。

第二坐标

第二坐标（横坐标或纵坐标）值取决于输出顺序。

第一坐标名称

第一坐标名称（横坐标或纵坐标）取决于输出顺序。

第二坐标名称

第二坐标名称（横坐标或纵坐标）值取决于输出顺序。


系统域代码

 概述和更多信息

系统域代码提供可使您访问系统所有信息，并提供特殊的函数。使用系统域代码可将另外的信息添加到报告中。

注： 这些系统域代码前面都可加上$System。 例如，[$System.time] 显示使用域代码时的计算机时间。

当不需要在这些域代码之前加$System时，使用这一前缀能避免可能产生的模糊因素。例如，[Time] 与[$System.Time]的值相同。

时间

显示使用域代码时的计算机时间。

日期

显示使用域代码时的计算机系统日期。

摘要

显示当前实体的摘要。

注： 点的摘要域代码在与项目相关的Options.ini文件中定义。通常，它使用名称和要素码域代码的形式为[Name] : [Feature Code]

空格:<数字>

显示一个或多个空格。

例如，域代码[$System.space:3]有三个空格。

重复<字符串>:<数字>

显示重复的文字。需要重复的文字必须包含在角括号(< >)中。

例如，域代码[$System.Repeat<->:80]显示八十个减号字符。更多信息，参见参数输入窗口。

列:<数>

显示同一行上从当前位置到指定列的空格数。

例如，域代码[$System.Column:40]插入空格，直到当前行的第四十列。

替换<查找><替换>

用‘替换’中的文字替换指定的‘查找’文字。替换<查找><替换>域代码必须在查找和替换要作用的域之后。如果替换域代码出现在要查找和替换的域之前，域不会被改变。

是否指定替换文字是可选的。如果不指定，‘查找’文字会多行中被删除。

例如，域代码[$System.Replace<�><degrees>]查找当前行的所有度数符号，交将它们替换为文字'degrees'。

字符：代码

通过指定字符代码插入一个字符。

注： 字符的输出根据所用的字体而有所不同。

例如，域代码[$System.Character:169]对于大多数字体给出字符 �。

用户名

显示用户的网络登录名。

计算机名

显示网络识别信息。可在Microsoft Windows 控制面板/网络中更改系统识别信息。

关于

显示产品名称和版本号。

例如，Trimble Geomatics Office，版本1.00。

目录名

有大量不同的域代码可用于特定的与系统相关的文件夹名称。

有效的目录名为：

ASCII导出

对于ASCII导出有效的两种域代码为：

计数器	显示所用的域代码数。它可用于分别识别导出的各个值。
行	显示导出文件中的行数。允许ASCII定义，在文件中对各行有行数记录。


参数输入对话框

警告： Trimble导航有限公司只支持用Trimble所有的Trimble Geomatics Office使用和修改此数据库。 Trimble不支持或授权其它软件应用程序使用，修改此数据库，也不保证此数据库的性能。Trimble可在任何时候修改数据库的格式，使它与其它软件应用程序不兼容。

如果需要输入值进行选项查询或完成域代码，出现此对话框。选择查询，需要参数的域代码有省略号(�)。Trimble Geomatics Office的很多地方会出现此对话框。

名称

显示要定义的参数。

值

输入所需的值。

在数据库查询的基础上完成数据训报告时，会出现参数输入对话框。


项目域代码

 概述和更多信息

项目域代码可使您访问特定的项目信息。使用这些域代码可将更多的信息添加到报告。

注： 这些域代码之前可有$Project。 例如，[$Project.projection] 显示项目使用的坐标系统投影的类型名称。

当这些域代码之前不需要加$Project时，使用此前缀避免模糊因素。例如，[Name] 与[$Project.Name]显示相同的值。

名称

显示用于项目的项目名称。

路径

显示保存项目的文件夹名称。

注： 此域代码与$System.Projects目录的输出相同。

投影

显示项目使用的坐标系统投影的类型名称。例如，Transverse Mercator。

自动名称

显示当前自动点名的名称。

例如， 如果前面分配的自动点名为AUTO 0008，则自动返回为AUTO 0009。

CAD图层

显示当前CAD图层名称。

单位：类型

显示恰当的单位名称。必须提供一个类型。

注： 距离，高程，坐标和角度都有效。

例如，域代码[$Project.Units:Distance]显示系统设置的距离单位。可包括名称':verbose' ，得到一个完整的域代码值。例如，要得到'Meters'而不是'm'，用[$Project.Units:Distance:verbose]。

类型：距离

显示距离的显示类型可在文件/项目属性/单位和格式中设置此项。

类型:LLH

显示纬度，经度和高度的显示类型 (地方或WGS-84).


标题域代码

 概述和更多信息

标题域代码可使您访问项目属性对话框中项目详细信息标签 的标题域中记录的数据。使用这些域代码可将更多的信息添加到报告。

注： 这些标题域代码之前可加上$Headings。例如， [$Headings.Title]显示当前项目的标题。

如果标题被改变，相应的标题域代码也被改变来进行反映。

当这些域代码之前不需要加$Headings时，使用此前缀避免模糊因素。

标准的标题 域代码有：

标题

显示当前项目的标题。

描述信息

显示项目的描述信息。

参照

显示项目参照数字，可将项目链接到办公室计算程序。

野外测量者

此域代码输出对于后期的参照有用。

计算机操作员

此域代码输出对于后期的参照有用。

日期

显示项目的创建日期。在使用模板项目的数据域代码时自动完成。

垂直基准

显示项目的垂直基准。

设备

显示设备的序号。


坐标系统域代码

 概述和更多信息

坐标系统域代码可使您访问项目的坐标系统的特定信息。使用这些域代码将更多信息添加到报告。

注： 这些坐标系统域代码之前可加上$Coordinate system。 例如，[$Coordinate system.System] 显示项目的坐标系统名称。.

当这些域代码之前不需要加上$Coordinate system时，用此前缀避免模糊因素。 用此前缀避免模糊因素。

注： $Coordinate system 域代码在没有相应设置时返回'未选择'。

系统

显示项目的坐标系统名称（例如，美国国家平面坐标系统1983）。

地区

显示项目使用的坐标系统区域名称（例如，California 地区 3 0403）。

基准

显示坐标系统投影的基准名称（例如，North American 1983 (Conus)）。

大地水准面

显示项目使用的大地水准面模型名称（例如， GEOID96 (Continental US)）。

站点

显示项目的站点定义名称。


投影域代码

 概述和更多信息

投影域代码可使您访问项目的坐标系统内投影的特定信息。使用这些域代码将更多的信息添加到报告。

注： 它些投影域代码之前可加上$Projection。例如， [$Projection.名称] 显示项目使用的坐标系统投影名称。

当这些域代码之前不需要加上$Projection时， 用此前缀避免模糊因素。

名称

显示投影类型的名称（例如，Transverse Mercator）。

剩余的投影域代码返回项目使用的投影的实际参数值。

注： 不是所有域代码对所有的投影类型都有效。也就是说，不是所有域代码在每一种情况下都有效。下列域代码的列表给出了所有可返回的投影参数。根据项目使用的投影的不同，只有恰当的域代码才能返回值。对于投影无效的域代码返回'N/A' (意思是不可用)。

以下域代码显示详细的值：

纵轴加常数

投影的纵轴加常数值。

横轴加常数

投影的横轴加常数值。

高程加常数

平面投影原点的椭球高度值。

原点高度

平面投影原点的高程值。

原点纬度

投影的原点纬度。

原点经度

投影的原点经度。

比例因子

投影的中心比例因子(统一的)。

方位角

Oblique Mercator和R.S.O.投影的倾斜方位角，带有倾斜方位角定义。

收敛角

Oblique Mercator的倾斜角度值和R.S.O.投影的倾斜角度值，带有原点收敛角定义的倾斜度。

平行线 1

Lambert 2 平行线和Albers等面积立体投影定义中使用的北平行线。

平行线 2

Lambert 2 平行线和Albers等面积立体投影定义中使用的南平行线。

点1纬度，点1经度，点2纬度，点2经度

这四个域代码用于由两点定义的Oblique Mercator和R.S.O. 投影，这些域在定义的点位置。


基准域代码

 概述和更多信息

基准域代码可使您访问项目的坐标系统中使用的基准的特定信息。使用这些域代码将更多的信息添加到报告。

注：这些基准域代码之前可加上$Datum。 例如， [$Datum.Method] 显示项目使用的基准方法的名称。

当这些域代码之前不需要加上$Datum时，用此前缀避免模糊因素。

注： 不是所有域代码对所有基准类型都有效。也就是说，不是域代码在每种情况下都有效。下列域代码的列表给出了可返回的所有基准参数。根据项目使用的基准的不同，只有恰当的域代码可返回值。任何对于基准无效的域代码将返回'N/A' (意思是无效)。

以下域代码显示详细的值：

方法

所用基准转换的名称（例如，三参数）。

X轴平移量

X轴上平移的值（对于三参数和七参数基准转换有效）。

Y轴平移量

Y轴上平移的值（对于三参数和七参数基准转换有效）。

Z轴平移量

Z轴上平移的值（对于三参数和七参数基准转换有效）。

X轴旋转量

X轴旋转的值（对于三参数和七参数基准转换有效）。

Y轴旋转量

Y轴旋转的值（对于三参数和七参数基准转换有效）。

Z轴旋转量

Z轴旋转的值（对于三参数和七参数基准转换有效）。

比例因子

七参数基准转换比例因子的值用百万分比 (ppm)表示。

椭球名称

项目中使用的椭球名称。

椭球扁率

椭球的扁率。

长半轴

椭球的长半轴。


校准域代码

 概述和更多信息

校准域代码可使您访问项目的坐标系统中使用的GPS点校准的特定信息。使用这些域代码将更多的信息添加到报告。

注： 这些校准域代码之前可加上$Calibration。 例如， [$Calibration.Rotation] 显示GPS点校准中平面转换的旋转值。

当这些域代码之前不需要加上$Calibration时， 用此前缀避免模糊因素。

注： 校准域代码根据GPS点校准的水平和垂直分量可分为两组。如果计算了分量，则各组的所有域代码都有效。也就是说，坐标系统中的垂直校准值有效时，垂直校准分量也都有效。下列域代码的列表给出了可返回的所有校准参数。对于校准无效的任何域代码将返回'N/A' (意思是无效)。

以下域代码显示了详细的值：

垂直原点纵坐标

垂直转换原点纵坐标值。

垂直原点横坐标

垂直转换原点横坐标值。

垂直改正值常量

转换原点的垂直平移量。

垂直纵向改正值

转换中每个单位纵坐标的垂直改正值。

垂直横向改正值

转换中每个单位横坐标的垂直改正值。

水平原点纵坐标

水平转换原点纵坐标值。

水平原点横坐标

水平转换原点横坐标值。

水平纵向平移量

纵向的水平平移量值。

水平横向平移量

横向的水平平移量值。

比例因子

水平转换中的比例因子（统一的）。

旋转值

水平转换中的旋转值。


特殊域代码

 概述和更多信息

这些特殊域代码可使您访问大量的计算机信息，并提供大量的特殊函数。 使用这些域代码将更多的信息添加到报告。

$File.filename

此域代码显示特定文件的内容。

注： 由于与某些域代码定义中的冒号字符冲突，不能将冒号(:)字符用于定义计算机字母驱动器。如果需要指定驱动器，使用<drive>代替'drive:'。例如，<C>指定C:驱动器。

Trimble Geomatics Office使用某些特殊域代码返回标准目录。

$Home (其中有TGOffice.exe)

$System (带有TGOffice.exe 的$home下的系统子目录)

$Project (当前项目的目录)

例如 [$FILE.<c>\temp\data.txt] or [$file.$system\myfile.txt]

注： 此处也可使用':expand'。

$Env.variable

显示命名的环境变量。

$Key.key

显示给定键的字符串，从.ini文件(或登记域)得到。

域代码 'name'的格式是key{,section}{;path}

如果省略了此项，则使用'域代码'，如果省略了路径，则假定为$System。

对于$File，路径可从以下几项开始：

  $Home

  $System

  $Project

注： 如果路径只是$Project，则使用项目的*.ini文件。 (先检验选项.ini，然后是tgo_v100.ini � 这是与各项目相关的.ini文件。) 如果路径只是$System ，则使用Trimble Geomatics Office的登录区域。

$Text.text

显示输入的文字。对于报告非常有用。

例如[$Text.Feature code:20]显示标签'要素码'与点之间有20个空格。


计划域代码
计划表域代码

 概述和更多信息

在计划表的定义中有几个特殊的域代码。使用这些计划表定义范围内的域代码，可使您将特定的信息显示到图上。

注： 这些计划表域代码之前可加上$Plot。 例如， [$Plot.Scale]显示绘图的比例。

当这些域代码之前不需要加上$Plot时， 用此前缀避免模糊因素。

比例

显示绘图的比例。

第一原点坐标名称

显示第一个原点坐标名称。例如，将文件/项目属性/单位和格式/坐标顺序选项设为纵向第一， 则[$Plot.First Origin Ordinate Name] 显示'纵坐标'。

第二原点坐标名称

显示第二个原点坐标名称。例如，将文件/项目属性/单位和格式/坐标顺序选项设为纵向第一， 则[$Plot.Second Origin Ordinate Name] 显示'横坐标'。

第一原点坐标

显示第一原点坐标值。 例如，将文件/项目属性/单位和格式/坐标顺序选项设为纵向第一， 则[$Plot.First Origin Ordinate Name] 显示图的原点纵坐标值。

第二原点坐标

显示第二原点坐标值。 例如，将文件/项目属性/单位和格式/坐标顺序选项设为纵向第一， 则[$Plot.Second Origin Ordinate Name] 显示图的原点横坐标值。

原点纵坐标

显示图的原点纵坐标值。

原点横坐标

显示图的原点横坐标值。

旋转值

显示图的旋转值。

计划表

显示计划表定义中指定的计划表名称。


修饰域

 概述和更多信息

域代码修饰域是用于修饰域代码输出内容的特殊命令。

使用修饰域可：

  得到域代码的特定输出

  输出数据时提供另外的格式信息或参数

可用多个修饰域修饰一个域代码。使用多个修饰域时，通常指定如下：

	[Field code{:FormatItem}{:FormatItem}{:FormatItem}{:FormatItem}]
其中FormatItem 是修饰域名称，或是格式设置。括号表明它们是可选项。

指定修饰域时，系统接受大小或小写或混合的字母格式。

可能的修饰域如下：

宽度值 (数字)

指定域代码输出宽度。如果宽度值为负，则输出左对齐，否则为右对齐。

例如， 如果要素码= "放样码"，则[Feature code:15] 显示"    sample code" (即，通过在前面增加4个空格，填满15个字符)。

Width.decimals 值(数字)

指定域代码输出的宽度和小数位数。修饰域格式为W.D，其中W为宽度，D为小数位数。

如果宽度值为负，则域左对文明，否则为右对齐。

如果宽度值以零开始，但不为零(如08.3)，则用零进行填充，不用空格。

例如，	if Elevation = 10.3258

Then	[Elevation:0.3] 显示 10.326

And	[Elevation:07.2] 显示 0010.33

单位

值后面加上单位。例如， m�为米，ift为国际英尺，sft为美制测量尺。可用此修饰域确定在文件/项目属性/单位和格式标签设为否时，也显示单位。

无单位

确定值后面不加单位。可用此变址符确定在文件/项目属性/单位和格式标签设为是时，也不显示单位。

大写字母

将域代码返回的任何字母转换为大写字母。

小写字母

将域代码返回的任何字母转换为小写字母。

右对齐

将域代码输出在指定的域宽度内右对齐。如果未指定域宽度，不进行任何对齐。

左对齐

将域代码输出在指定的域宽度内左对齐。如果未指定域宽度，不进行任何对齐。

居中

将域代码输出在指定的域宽度内居中。如果未指定域宽度，不进行任何对齐。

例如， 如果域代码= "example"

则 [Feature code:11:Center] 显示 "  example  ".

也就是说，此种情况下返回时前后各有两个空格。

截取

根据给定宽度截取输出内容(如果宽度为正或负，则分别截取前面/后面部分)。

例如， 如果域代码 = Example

则 [Featurecode:4:Trim] 显示 'Exam'

[Featurecode: -4:Trim]显示 'mple'

扩展

扩展应用了‘扩展’的域代码返回的文字中找到的任何域代码。

例如， 域代码 [$File.$System\text.txt:expand]，在导入文件时使用，则在显示前将 Text.txt 文件中找到的任何有效域代码进行扩展。

标准

将输出转换为标准数字标点(点为小数符号，无数字组符号，即无千分号)。

注： 此修饰域只用于报告的定义。导入程序可以标准形式接收数字数据(无数字组符号和小数点)或使用Microsoft Windows系统中的数字组符号和小数点符号的值。导出程序将数字输出转换为标准形式。

倒置

将相应域代码的意义倒置。例如， [Azimuth:Reverse] 将给定线通常返回的方位角倒置。

象限角

在象限中显示方位角。例如， 方位角228�37'25"显示为N81�22'35"W。

整圆

以整个圆显示方位角。例如， 如果方位角格式设置为象限中的北81度22分35秒西，则显示为228�37'25"。

详细

在恰当的地方使用完整文字。例如，如果单位简写为'm'，则使用详细修饰域显示文字'meters'。

分离

将字符串用小数点分离。

例如， 修饰域[Elevation:split]给出没有小数点的高程。

注： 此修饰域在设计注释模板时，对于上 点注释位置有用。

此修饰域用一个空格替换'.'，但可使用如:split<3>进行增加。

IntPart

去掉值的小数部分(直到'.')。

FracPart

去掉值的整数部分(从'.'开始)。

隐含

数字值中没有小数点但隐含其位置时，导入和导出ASCII文件。此修饰域与标准宽度和小数修饰域一起使用。

例如， [Northing:10.3:Implied] 将4853297.692的纵坐标值输出为4853297692。同样的域代码定义允许在导入时将隐含的小数点正确译出来。


格式设置

 概述和更多信息

格式设置可使您建立域代码。

例如， 可用格式设置成分建立日期的域代码：

[Date:<{DDDD}, {MMM} {D}-{YYYY}!>]

将得到Sunday, Oct 17 1999!

注： 可在域代码中包含文字。在上例中，包含了感叹号。

格式设置通常包括在角括号(< >)(对于完整的格式设置)或大括号({ }) (对于格式设置的成分)。

格式设置只应用于一定的数据类型。分别为：

  日期格式设置

  时间格式设置

  角度/方位格式设置

日期和时间提供了格式设置的成分，而角度/方位提供了完整的格式设置。


日期格式设置

 概述和更多信息

日期格式设置对域代码的日期成分显示进行控制。例如，包含成分dd的日期域代码表示的日期在前面要加上零。

注： 用代表值表示的日期格式设置在域/高级/更多/格式设置选项的快捷菜单中有效。这些示范日期设置自动转换为此外列出的使用详细域代码。

日期格式设置的所有有效类型列表如下：


时间格式设置

 概述和更多信息

时间格式设置对域代码的时间成分显示进行控制。例如，时间域代码可能包含hh显示小时，前面加上零(12小时钟)。

注： 用代表值表示的时间格式设置在域/高级/更多/格式设置选项的快捷菜单中有效。这些示范时间设置自动转换为此外列出的使用详细域代码。

时间格式设置的所有有效类型列表如下：

注： 格式设置的每天时间成分必须按照顺序设置，为小时，分，秒和毫秒，最后是t或tt 。可省略这些格式项中的任一项。

日期和时间成分都能用于日期和时间域代码；传入的数带有所有信息。成分的大小写对于区别分(m)和月(M)是非常重要的。

例：

<DDDD, MMM D, YYYY!> 给出 'Thursday, Oct 14 1999!'  为当前日期。

<hh mm sstt!> 给出 '01 02 07pm!'  为当前时间。


角度/方位格式设置

 概述和更多信息

角度/方位格式设置对域代码的角度/方位成分显示进行控制。 例如，方位角域代码可包含成分<dm.mm>用度和十进制分来显示方位角。

注： 角度/方位角格式设置对于域/高等/更多/格式设置选项中的快捷菜单有效。

有效的角度/方位格式设置类型为：

十进制秒

用度，分和十进制秒（当角度单位设为角时）显示角度/方位。此格式设置插入设置字符<dms.ss>。 例如， [Azimuth:0.3:<dms.ss>]将方位角值显示到秒的第三个小数位。

十进制分

用度，十进制分（当角度单位设为角时）显示角度/方位。此格式设置插入设置字符<dm.mm>。 例如， [Azimuth:0.4:<dm.mm>]将方位角值显示到分的第四个小数位。

十进制度

用十进制度（当角度单位设为角时）显示角度/方位。此格式设置插入设置字符<d.dd>. 例如， [Azimuth:0.6:<d.dd>]将方位角值显示到度的第六个小数位。

有符号的十进制度

用十进制度（当角度单位设为角时）显示角度/方位，且在值之前加上符号。此格式设置插入设置字符<+d.dd>。例如， [Latitude<+d.dd>:0.8]显示纬度值到度的第八个小数位，且值的前面有字符(+ 或 -)。


域代码置换

 概述和更多信息

域代码置换重新组织某些特殊的非域代码字符序列。它们设置如下：

例：

要创建用标签分隔的ASCII输出格式，使用以下域代码：

[名称]\t[Easting]\t[Northing]\t[Elevation]\t[Feature Code]

要注释带有方位角的线和两条线之间的距离，使用以下域代码：

[Azimuth]|[Distance]


域代码和ASCII导入

 概述和更多信息

导入格式允许的域代码为：

  只在点表格中的域

  无子记录，且无系统域代码。

(例外为[$System.Repeat<find><replace>]，这是允许的)

某些计算域是可允许的（例如，纬度/经度）。

$Skip

有一个特殊的范围($Skip)可帮助翻译ASCII输入：:

空格

此域代码跳过由宽度指定的空格数，或未指定宽度时的非空格数。需要确定在Skip加了一个空格，使Trimble Geomatics Office知道前一域结束的地方。例如：

[名称] [$Skip.Space][Northing] [$Skip.Space][Easting] [$Skip.Space]

数字

此域代码跳过一个数字(符号 '+', '-', '.' 及'0'...'9')。如果有宽度，它跳过恰当的字符数；否则，它足过第一个不是数字的字符。

注： 对于零或指数无效。

行

此域代码跳过宽度中指定的行数，或一行。

文字

此域代码跳过指定的字符数或直到一个非打印字符 (如'\n')为止。

列

此域代码跳过指定的列数。

到:字符串

此域代码跳到指定字符串后的第一个字符(如，[$Skip.To:ENTITIES])。

注： 字符串不包括新的行。

有一些特殊的'格式函数'：

标准

此格式函数转换标准标点的输入内容： '.'变为小数点字符。

跳过

此格式函数正常读取域，但不保存它(例如，[Point.Horz Prec:10.3:skip])。

= (等号)

此格式函数用格式字符串的其余部分分配域值。它不浏览文件(例如，[Feature code:=imported])。 这样的域必须是定义域代码字符串中的第一个 (否则解析会出现混乱)。例如'[Elevation:=0.0][名称],[Northing],[Easting]'

注： 定义ASCII导入格式时，必须指定域代码宽度(如[WGS Latitude:11])或者指定域代码之间 的分隔字符(如[WGS Latitude],[WGS Longitude],[WGS Height]，其中逗号表示域的结束)。这是因为导入程序试图从ASCII文件翻译值时，使用格式定义来完成文件行的各部分，而文件行要读入到指定的数据库域中。宽度或分隔字符可确定文件行的相应部分。

注： 要将事件时间显示为接近毫秒，将以下时间格式设置添加到域代码， <H:mm:ss.nnn>，其中nnn是十进制秒的数位。 例如， [Point Obs.Time:<H:mm:ss.nnn>]。要增加时间精度，需增加十进制秒的位数。例如， nnnn输出秒的前4个位数。


域代码参数对话框

使用此对话框完成域代码。对话框的标题表明了上下文。

名称

此栏显示要定义的参数。

值

输入所需的值。


将文件传输到Trimble Survey Controller - 概述

更多信息

如何做...	对话框
概述

用户可以将野外要用到的文件传输到Trimble Survey Controller。为此，用户必须数据传输在中安装测量控制设备。

用户可以传输下列类型的数据：

  天线文件

  数据网格文件 (*.cdg)

  设备文件 (*.dc)

  数据字典文件 (*.ddf)

  DTM 点

  要素和属性库 (*.fcl)

  大地水准网格文件 (*.ggf)

  英国国家网格文件 (*.pgf)

  CSV文件

  背景地图文件


天线详细资料到测量控制器选项

如果用户已经在天线文件中编辑了天线信息，用该选项将这些信息传输到Trimble Survey Controller。

  对 Trimble Survey Controller6.0或更高版本，天线的详细资料存储在Antenna.ini 文件。

  对 Trimble Survey Controller5.3或较低版本，天线的详细资料存储在Antenna.dat 文件。

注：为了导出天线的详细资料，相应的天线文件必须位于Program Files\Common Files\Trimble\Config文件夹下。


测量控制器文件(*.dc)选项

测量控制器(*.dc)文件提供了Trimble Geomatics  Office 和Trimble Survey Controller之间的连接。当用户从Trimble Survey Controller中导入一项工程或从Trimble Geomatics Office导出一项工程到这种文件格式时，就创建了这些文件。

应用Trimble Geomatics Office，用户可以：

  导入一项测量控制器文件 (*.dc)

  导出一项 Trimble Geomatics Office 项目到一个测量控制器文件 (*.dc)，然后传输到Trimble Survey Controller。

导入一项测量控制器文件(*.dc)：

1．	选文件/ 导入，弹出导入对话框。

2．	选测量标签。

3．	选测量控制器文件选项(*.dc)，弹出打开对话框。

4．	从一个文件夹中选择用户希望导入的文件，点击打开。

从当前Trimble Geomatics Office 项目中导出一项测量控制器文件(*.dc)：

1.	选文件 / 报告， 弹出导出对话框。

2.	选测量标签 。

3.	选测量控制器文件(*.dc) 选项。

4.	点击选项打开设备选项对话框，指定文件的内在名和测量控制器文件版本。

5.	点击确定，接受设置，回到导出对话框。

6.	点击确定，出现另存为对话框。

7.	选择用户欲保存文件的目录。

8.	缺省情况下，文件名即项目名。在文件名一栏输入一个名称即改变了文件名，点击保存进行保存。


测量控制器选项

应用Trimble Geomatics Office ，用户可以直接在Trimble Geomatics Office 项目和测量控制器软件间转换数据。当向Trimble 测量控制器中导入一项工程时，它就被转换为测量控制器文件(*.dc)格式，这种格式用在Trimble Geomatics Office中。

Trimble Geomatics Office 可以用来：

  从Trimble Survey Controller导入任务

  导出Trimble Geomatics Office 项目到 Trimble Survey Controller

为得到该选项，按下面的一种方法做：

  将一项测量控制器工程导入到Trimble Geomatics Office项目中：

1．选文件 / 导入，出现导入对话框。

2．选测量标签。

3．选测量设备选项，点击确定，出现数据传输打开对话框。

  将一项Trimble Geomatics Office项目导出到测量控制器：

1．选文件 / 导出，出现导出对话框。

2．选测量标签。

3．选测量设备选项。

4．点击选项，打开设备选项对话框，指定文件的内在名和测量控制器文件版本。

5．点击确定，接受设置，回到导出对话框。

6．点击确定，出现数据传输打开对话框。

注：如果用户使用测量控制器7.60版本进行数据的传入传出，请使用7.5 dc版本的文件格式。如果用户使用测量控制器7.5版本进行数据的传入传出，请使用7.6 dc版本的文件格式。


数据采集器选项对话框
设备选项对话框

该对话框用来指明设备的类型，用户需要导出数据到该类型的设备。

为此：

1.	选文件 /导出。出现导出对话框。

2.	选测量标签。

3.	选下列选项之一：

  DTM 点到文件

  DTM 点到测量控制器

  要素和属性库到测量控制器

  SDR文件

  测量控制器

  测量控制器文件

4.	点击选项。

注： 外业的利用情况取决于户所选的类型。

版本

选择与数据格式相关的版本。

项目/文件名

列出需要导出的工程或文件类型的名字。导出一个工程时，Trimble Geomatics Office项目名为缺省名。用键盘为文件输入一个新名。

输出要素和属性

选复选框，对用户需要导出的项目所用到的要素和属性库以及项目所属点的所有要素和属性信息进行传输。该选项只能在测量控制器7.00或更高版本可以使用。

导出直线和弧段

选择本检验框导出用于项目的直线和弧段到Trimble Survey Controller。只有在选择集包括直线和弧段时，本选项才可以用，并且只对Trimble Survey Controller10.00或更高版本有效。

输出为

选择需要输出到设备文件的点。

输出可以是WGS-84或网格位置。这取决于用户所选择的数据格式和版本，以及数据库坐标系的精度，通常不是二者都可用。比如，Trimble Survey Controller4.00以前的版本只接受WGS-84位置，确定Sokia SDR20只接受网格位置。

项目的坐标系会影响输出到Trimble Survey Controller文件的数据。Trimble Survey Controller6.50版本和较早的版本不支持数据网格（例如，NAD83 HPGN和 NADCON）和多重衰退数据转换方法。Trimble Survey Controller 7.00版本不支持数据网格。

如果导出到Trimble Survey Controller的数据不支持项目指定的数据转换方法，创建的.dc文件中数据记录使数据方法设为None。错误的网格位置不能在Trimble Survey Controller中列出。参见数据转换方法和Trimble Survey Controller 获得更多信息。

同样，Trimble Survey Controller4.00版本不支持大地水准面模型。如果一个项目用到大地水准面模型，数据方法也置为None。这保证了Trimble Survey Controller4.00版本不显示错误的数据。

为了在外业使用传输网格坐标数据，用户必须执行一项内业标准，使网格数据和观测的GPS数据相关。参见大地水准面模型和测量控制器获得更多信息。

文件的详细资料

选择“附加”文件复选框，包含已存在于输出中的.dc文件的数据。浏览按扭变为可用。点击浏览按扭定位用户希望包含在新文件中的.dc文件。当前项目中的数据就附加到了新文件中。

如果用户的某项文件包含控制点，并且用户希望添加需要输出的数据，该选项就比较有用。这保持已有.dc文件的初始状态。


数据采集器单位
设备单位

导入一项Trimble Survey Controller文件(.dc)或SDR格式的文件时，文件头中的单位定义用来进行单位转换。Trimble Geomatics Office通常用国际单位SI (米)数据，因此从设备文件导入的数据会相应的转换。

选择怎样在屏幕上显示数值：

1.     选择文件 / 项目属性。

出现项目属性对话框。

2.     选择单位和格式列表应用列表选择显示的单位。

注：SDR 文件的距离单位设置只有英尺和米。对于SDR文件，如果坐标单位被设为美国测量英尺，英尺值应视为美国测量英尺值。


DC文件属性注释（测量控制器V4）选项

属性注释文件是简单的，由逗号限制的文件。它们包括收集为属性注释的点的属性，这些属性注释在运行Trimble Survey Controller（版本3或4）的设备中。该选项不能导出已收集的用来做要素和属性库的属性。（在Trimble Survey Controller7.00或更高版本可以使用）。

该选项只导出已收集的用做注释记录的属性。

方法为：

1．	导入一项包含属性注释的Trimble Survey Controller版本3或4的文件到Trimble Geomatics Office项目。

Trimble Geomatics Office创建一个选项设置。该选项设置被命名为与该文件内部工程名相同的名字。

2．	选择已创建的选项设置。该选项设置从项目中为属性文件读取点。

3．	导出包含属性注释的.dc文件。

下面为一已生成的文件类型的例子：

1000,5315.362,1056.274,82.361,TREE,TYPE,PINE,HEIGHT,25,GIRTH,0.5

1001,5382.728,1132.692,75.472,TREE,TYPE,BIRCH,HEIGHT,20,GIRTH,0.4

1002,5298.048,1162.472,55.927,PP,VOLTAGE,110KV,CABLES,3

1003,5308.682,1192.329,62.854,PP,VOLTAGE,110KV,CABLES,3


DTM 点到测量控制器选项

用该选项输出DTM点到运行Trimble Survey Controller的设备。

为此：

1．选文件 / 报告。出现导出对话框。

2．选测量列表。

3．选DTM点到测量控制器选项。

4．点击选项，指明用户需要导出的文件名和测量控制器的版本。

5．点击确定，接受设置，返回到导出对话框。

6．点击确定，弹出数据传输另存为对话框。

选择导出的点必须是规则网格点。也就是说，这些点在北-南方向和东-西方向必须等间距均匀分布，形成网格。典型做法是，这些网格点是从坐标的ASCII文件导入到系统中。用户必须确认只有规则网格点被选来导入，而没有其它的“非网格”点包含在当前选择中。

一旦导出选项被选中，Trimble Geomatics Office系统将对所选中的网格点分类，排成适当的顺序，并且按Trimble Survey Controller的要求创建特定格式的文件。


DTM 点到文件(*.dtx)选项

用该选项输出DTM点到数字高程模型文件(*.dtx)。

为此：

1．选文件/ 导出。出现导出对话框。

2．选测量列表。

3．选DTM点到文件(*.dtx)选项。

4．点击选项，指明用户需要导出的文件名和测量控制器版本。

5．点击确定，接受设置，返回到导出对话框。

6．点击确定，弹出另存为对话框。

7．输入文件名，选择用户希望保存文件的文件夹。

8．点击确定。

选择导出的点必须是规则网格点。也就是说，这些点在北-南方向和东-西方向必须等间距均匀分布，形成网格。典型做法是，这些网格点是从坐标的ASCII文件导入到系统中。用户必须确认只有规则网格点被选来导入，而没有其它的“非网格”点包含在当前选择中。

一旦导出选项被选中，Trimble Geomatics Office系统将对选中的网格点分类，排成适当的顺序，并且创建数字高程模型(*.dtx)格式的文件。


数据网格到测量控制器(*.cdg)选项

也请参见
用该选项创建组合的网格数据文件，从而传输到Trimble Survey Controller。

为此：

1．选文件 / 导出。出现导出对话框。

2．选测量标签。

3．选数据网格到测量控制器(*.cdg)选项。

弹出导出一个数据网格对话框。

数据网格文件存储特定地区的数据网格转换。用Trimble Coordinate System Manager�的功能，用户可以定义一坐标系，该坐标系用一数据网格文件作系统的数据转化（如，NADCON）。然后可为用户的Trimble Geomatics Office项目选一坐标系，该坐标系用一数据网格。为了利用外业的数据网格文件，用户需将该数据网格文件作为一个组合数据网格文件传到Trimble Survey Controller（7.00或更高版本）。参考数据转化和测量控制器主题，获得更多对不同Trimble Survey Controller版本有效的数据转化方法的信息。

对用户所选择的数据网格，在Program Files\Common Files\Trimble\Geodata文件夹下有一个经度网格文件和纬度网格文件。在导出到Trimble Survey Controller之前，这些文件必须加以组合。一旦用户选择创建一组合数据网格文件导出到Trimble Survey Controller这一选项，软件就将与项目的坐标系指定的数据网格相关联的文件组合。

当用户创建一组合数据网格文件，并且在Trimble Survey Controller中用到后，初始数据网格的名字就存储在.dc文件中，如NADCON (HPGN)。

如果用户导入 .dc文件到Trimble Geomatics Office，当外业所用的坐标系和Trimble Geomatics Office项目定义的坐标系匹配时，它就用该名字。

注意：用户只能从当前正在使用的数据网格文件创建一组合数据网格文件，但是用户可以导出任何组合数据网格。

用户可以：

  传输已有的 组合网格数据 (.cdg) 文件。

  创建一新的组合网格数据 (.cdg) 文件，用来导出到Trimble Survey Controller。

注意：用户也可以用Trimble Grid Factory�这一功能组合数据网格文件。用Trimble Geomatics Office自定义安装选项，安装Grid Factory这一功能。


数据转换和Trimble Survey Controller

Trimble Geomatics Office支持数据转换中使用数据网格和多重衰退的定义。

该软件提供的坐标系数据库中，提供了许多用这些数据转换方法定义的坐标系。

Trimble Survey Controller 7.00以前的版本不支持任何一种这些数据转换类型。Trimble Survey Controller 7.00版本支持数据网格。

Trimble Geomatics Office不能创建：

  一个涉及到上述任何数据转换方法的Trimble Survey Controller 6.50或之前版本的.dc文件

  一个涉及到一次多重衰退数据转换的Trimble Survey Controller 7.00版本的.dc文件

如果某项工程用到了一种不支持的方法，当这项工程的点被导出到Trimble Survey Controller 的 .dc文件时，Trimble Geomatics Office输出方法设置为None.的数据记录。

这就意味着在Trimble Survey Controller中，不能在WGS-84和网格位置之间互相转换点的视图。这同时意味着如果用户在更多的外业工作中能应用这些点之前已经传输了网格位置，那么在外业工作中必须执行统一的标准。

如果为了统一标准，网格位置已经经过了传输，则不存在这个问题。用户可以随时对WGS-84位置转化。但是，只有在执行了某一内业标准后，才能看到网格坐标。


导出一数据网格对话框
导出一数据网格对话

应用该选项可以导出一数据网格(*.cdg)文件。

为此：

1．选文件 / 导出。出现导出对话框。

2．选测量标签。

3．选数据网格到测量控制器(*.cdg)选项。

4．点击确定。

当用户选择了数据网格到测量控制器(*.cdg)选项时，会弹出导出一个数据网格对话框。

导出现有的组合数据网格文件到测量控制器

选该选项导出一个组合数据网格文件到Trimble Survey Controller（7.00或更高版本）。用户可以对GeoData文件夹中存在的任何组合数据网格文件导出。用户选该选项后，弹出选择对话框。

创建一个组合数据网格文件导出到测量控制器

选该选项用当前项目坐标系使用的数据网格文件创建一个组合数据网格文件。弹出创建一组合数据网格文件对话框。


另存为对话框（数据网格/大地水准面网格导出）

用该对话框为组合数据网格(*.cdg)文件或大地水准面网格(*.ggf)文件命名。

点击确定，打开数据传输另存为对话框。


创建一组合数据网格文件对话框

创建该对话框来定义用户希望产生一组合数据网格(*.cdg)文件的地区。然后用户可以将该组合数据网格文件传到Trimble Survey Controller在外业使用。

为了创建一.cdg文件，项目的坐标系必须用一个数据网格做它的坐标系。参见Trimble Coordinate System Manager� 工具的在线帮助，获得更多应用数据网格文件的信息。

为此：

1．	选文件/导出，弹出导出对话框。

2．	选测量标签。

3．	选数据网格到测量控制器选项。

4．	点击确定，弹出导出数据网格对话框。

5．	选为导出到Trimble Survey Controller创建组合数据对话框。

6．	点击确定。

地球上的黄色框定义被纬度和经度数据网格文件覆盖的地区。

用这些工具，在用户希望组合数据网格覆盖的数据网格内，在地球的一个地区上拉出一个框。

文件特性

文件特性组表示正被文件用来创建.cdg文件。

数据网格：

显示数据网格文件正被用来创建.cdg文件。

纬度网格文件：

显示纬度网格文件正被用来创建.cdg文件。

经度网格文件：

显示经度网格文件正被用来创建.cdg文件。

网格特性

网格特性组显示用户正定义的网格特性。

纬度界限

显示当前框的纬度界限。

经度界限

显示当前框的经度界限。

文件大小

显示创建的.cdg文件的大小。当用户改变地球上框的形状时，文件大小改变。

测量控制器名称

显示将在Trimble Survey Controller中用到的.cdg文件的内在名字。测量控制器名称默认为初始数据网格的名字。如果在一个Trimble Survey Controller工程中用到.cdg文件，要引用其内在名称。在导入设备(*.dc)文件时，如果在*.dc文件中用到的组合数据网格与Trimble Geomatics Office项目的数据网格匹配，Trimble Geomatics Office采用该内在名称。

注意：如果用户编辑该地区，请确认用户只是为名称添加了后缀和前缀。这将保证名称唯一并且在原始数据网格被导入时仍然可识别。除非测量控制器名称包含数据网格名称，用户不能继续工作。

地球特性

地球特性组显示鼠标位置，提供配置地球外观的选项。

鼠标位置

显示地球范围内鼠标所指的当前经度和纬度位置。

显示州界

选该复选框显示地球上的州界。

显示国界

选该复选框显示地球上的国界。

显示河流

选该复选框显示地球上的河流。


大地水准面文件到测量控制器(*.ggf)选项

更多信息

如何做...	对话框	也请参见
概述

大地水准面网格(*.ggf)文件存储特定地区的WGS-84椭球面和大地水准面之间的分离。参见大地水准面 模型椄攀� 获得更多大地水准面模型的信息。

如果一个.ggf文件被用做一项Trimble Geomatics Office项目的坐标系的一部分，要计算相应的GPS点的高程。为了在野外用.ggf文件，用Trimble Geomatics Office将.ggf文件传输到Trimble Survey Controller（6.00或更高版本）。

为此：

1.  选文件 / 导出，弹出导出对话框。

2.  选测量标签。

3.  选大地水准面文件到测量控制器选项。

弹出导入一个大地水准面模型对话框 用该选项，用户可以选择：

  在 Program files \ Common files \ Trimble \ GeoData 文件夹下传输任何 .ggf文件。

  次网格 .ggf 文件用来在当前Trimble Geomatics Office项目中提取一较小的大地水准面网格文件。这种方法减小了用户发往运行Trimble Survey Controller（6.00或更高版本）的TSC1设备的.ggf文件的大小。

参见大地水准面模型对话框和测量控制器主题，获得不同Trimble Survey Controller版本所支持的大地水准面模型的信息。

当用户希望通过次网格创建一个新的.ggf文件，原始大地水准面模型的名字被保存（如，GEOID96 Conus）。这个内在名也包含在用次网格的.ggf文件的.dc文件。在导入一个.dc文件时，如果外业所用的 大地水准面模型和Trimble Geomatics Office 项目所定义的大地水准面模型匹配，Trimble Geomatics Office就采用该.dc文件名。

注意：用户也可以用Trimble Grid Factory功能得到一个次-网格大地水准面模型文件。Trimble Grid Factory功能是安装Trimble Geomatics Office时自定义安装的一部分。


大地水准面文件到 TDS Survey Pro CE (*.ggf) 选项

更多信息

如何做...	对话框	也请参见
概述

大地水准面网格文件（*.ggf）对已定义的面积存储WGS-84椭球和大地水准面之间的分离值。有关大地水准面模型的信息，请看主题大地水准面模型 − 概述。

如果 .ggf文件用作Trimble Geomatics Office项目的坐标系统部分，则可计算出GPS点的近似高程。为了在域中使用 .ggf文件，用Trimble Geomatics Office把 .ggf文件传输到TDS Survey Pro CE (v3.5 或更高版本。)

方法是：

1.	选择文件/导出。导出对话框出现。

2.	选择测量标签。

3.	选择大地水准面文件到TDS Survey Pro CE选项。

导出大地水准面模型对话框出现。

用本选项可以：

  在Program files\Common files\Trimble\GeoData文件夹中选择传输任何 .ggf文件。

  用在当前Trimble Geomatics Office项目提取较小大地水准面网格文件的次网格 .ggf 文件。这个过程可减小发送到运行TDS Survey Pro CE (v3.5或更高版本)的TSCE设备的 .ggf文件大小。

注：也可以用网格工厂程序获得大地水准面模型文件的次网格。网格工厂程序是Trimble Geomatics Office安装的自定义选项部分。


大地水准面模型和Trimble Survey Controller

大地水准面模型可以传输到Trimble Survey Controller6.00版本（或更高版本）。当在WGS-84位置和网格(NEE) 位置之间转换点的显示时，Trimble Survey Controller用到这些大地水准面模型。

通常，大地水准面模型是很大的文件。一般情况下，不能上载一个完整的大地水准面模型到Trimble Survey Controller6.00版本（或更高版本）。

用文件/导出/大地水准面文件到测量控制器选项为用户所用地区创建一个较小的大地水准面模型。用户可以将这个较小的文件传输到Trimble Survey Controller。

较早的Trimble Survey Controller版本

下面一些点与Trimble Survey Controller较早版本有关。

版本5

这是一个军用版本，不能做民用版本使用。

版本4

该版本不能用大地水准面模型。如果Trimble Geomatics Office试图将由网格位置或WGS-84位置的点位规定的一个完整的坐标系定义写入到一个Trimble Survey Controller版本4的.dc文件，在Trimble Survey Controller中可能回出现错误的海拔高/正常高。

在Trimble Survey Controller中交换数据视图时，可能会出现这种情况。当网格位置已被传输时，显示错误的WGS-84海拔高，或者当WGS-84位置被传输时，显示错误的网格点正常高。

为避免这种情况，Trimble Geomatics Office从项目定义中输出数据记录，然后警告用户不能在NEE和某一大地水准面模型WGS-84数值之间转换，同时提醒用户已增加一个空白转化。这样会产生另一个方法设置为None的数据记录。这意味着在Trimble Survey Controller版本4中，不能在WGS-84位置和网格位置之间转换点的视图。这避免了显示任何错误的数值。

对外业工作，这意味着如果用户上载了网格位置，用户必须执行同一标准。在用这些点进行新的外业前，用户必须这样做。（如果为了统一的目的，已经传输了网格位置，则不存在这个问题。）

注意：如果需要传输WGS-84位置，用户可以随时开始。但是，只有采用同一内业标准，才能看到网格坐标。

版本4之前的版本

因为WGS-84位置不受在一项工程中采用某一大地水准面模型的影响，所以较早的版本Trimble Survey Controller只能上载WGS-84位置。


导出一个大地水准面模型对话框

当用户选大地水准面文件到测量控制器(*.ggf)选项，或者选择大地水准面文件到 TDS Survey Pro CE (*.ggf) 选项时，弹出一个“导出一个大地水准面模型”对话框。

导出已有的大地水准面模型到测量控制器

选该选项导出一个已有的大地水准面模型文件到Trimble Survey Controller（版本6.00或更高版本），或者到TDS Survey Pro CE 版本 4 或更高版本）。用户可以导出GeoData文件夹下的任何大地水准面模型文件。如果用户选该选项，弹出“选择”对话框。

创建一个大地水准面模型的次网格，导出到测量控制器

选该选项，次网格当前项目坐标系所用的大地水准面网格文件。弹出“创建大地水准面网格文件”对话框。


创建大地水准面网格文件对话框

用该对话框来定义地区，用户希望对该地区创建一新的、基于当前项目坐标系所用的大地水准面网格文件的大地水准面网格文件。

为此：

1．	选文件/导出，弹出导出对话框。

2．	选测量列表。

3．	选大地水准面文件到测量控制器(*.ggf)选项，或者大地水准面文件到TDS Survey Pro CE (*.ggf)选项。

4．	点击确定，弹出一导出一个大地水准面模型对话框。

5．	选创建一大地水准面模型的次网格，导出选项。

6.	点击确定。

球体上的黄色框定义大地水准面模型覆盖的地区。

用这些工具，在用户希望大地水准面网格覆盖的大地水准面模型内，在地球的一个地区上拉出一个盒子。显示当前框的文件大小。

文件特性

文件特性组表示正被文件用来创建.ggf文件的大地水准面网格文件的特性。

大地水准面

显示当前项目坐标系所用的大地水准面模型

大地水准面网格文件

显示在大地水准面模型中使用的大地水准面网格文件

网格特性

网格特性组显示用户正定义的网格特性。

纬度界限

显示当前框的纬度界限。

经度界限

显示当前框的经度界限。

文件大小

显示创建的大地水准面网格文件的大小。当用户改变地球上框的形状时，文件大小改变。

名称

显示将在Trimble Survey Controller 或 TDS Survey Pro CE中用到的次网格文件的内在名字。测量控制器名称默认为初始大地水准面模型的名字。如果在一个Trimble Survey Controller工程中用到.ggf文件，要引用其内在名称。在导入设备(*.dc)文件时，如果在*.dc文件中用到的大地水准面模型与Trimble Geomatics Office项目定义的大地水准面模型匹配，Trimble Geomatics Office采用该内在名称。

注意：如果用户编辑该地区，请确认用户只是为名称添加了后缀和前缀。这将保证名称唯一并且在原始大地水准面模型被导入时仍然可识别。除非测量控制器名称包含大地水准面模型名称，用户不能继续工作。

地球特性

地球特性组显示鼠标位置，提供配置地球外观的选项。

鼠标位置

显示地球范围内鼠标所指的当前经度和纬度位置

显示州界

选该复选框显示地球上的州界

显示国界

选该复选框显示地球上的国界

显示河流

选该复选框显示地球上的河流

注：用户也可以用Trimble Grid Factory功能得到一个次-网格大地水准面模型文件。Trimble Grid Factory功能是安装Trimble Geomatics Office时自定义安装的一部分。


要素和属性库到测量控制器(*.fcl)选项

 概述和更多信息

为了导出一个要素和属性库到Trimble Survey Controller：

1．选文件 / 导出。出现导出对话框。

2．选测量列表。

3．选要素和属性库到测量控制器(*.fcl)选项。

弹出要素和属性库对话框。

用该选项导出一要素和属性库到Trimble Survey Controller，这样用户可以收集外业中的要素符号。用户也可以用该要素和属性库收集由属性定义的特征符号的属性。


选择要素和属性库对话框

用该对话框选择用户希望转移到测量设备的要素和属性库。

浏览

点击浏览选一个库。

文件

文件默认为最后导出的那个文件的名称。

导出属性

只有在导出到Trimble Survey Controller 7.00或更高版本时才能选择此选项。选复选框导出要素和属性库中包含的属性定义。

如果用户希望收集外业属性信息，可以使用该选项。如果用户清除该复选框，库文件中定义的任何属性都不能导出。

用户不能用该方法导出到TDS Survey Pro CE 或 Trimble 3600/5600 TDS 软件。

确定

一旦用户选择了适当的要素和属性库，点击确定。

弹出数据转移存储为对话框。

注意：控制代码也可以导出到Trimble Survey Controller。


要素和属性库选项对话框

用该对话框规定用户正导出的Trimble Survey Controller的版本。

1．	选文件 / 导出，弹出导出对话框。

2．	选测量列表。

3．	选要素和属性库到测量控制器选项。

4．	点击配置。

版本

如果用户选择Trimble Survey Controller7.00之前的版本，则选择要素和属性库对话框中的导出属性复选框不能用。因为这些版本不支持属性。


数据字典到测量控制器(*.ddf)选项

 概述和更多信息

用该选项导出一个数据字典文件到Trimble Survey Controller7.00 或更高版本。在Trimble Survey Controller中，用数据字典文件收集属性。

导出一个数据字典文件到Trimble Survey Controller：

1．	选文件 / 导出，弹出导出对话框。

2．	选测量列表。

3．	选数据字典文件到到测量控制器(*.ddf)选项。

4．	点击确定。

弹出选择对话框。


选择对话框（导出数据字典文件到Trimble Survey Controller）

用该对话框选择用户希望转移到Trimble Survey Controller的数据字典(*.ddf)文件。

当用户点击打开时，弹出数据传输存储为对话框。


从Trimble Survey Controller转移数据 - 概述

 如何做...

概述

用户可以将运行一个Trimble Survey Controller的设备和传输工程到Trimble Geomatics Office结合。在导入时，工程被转换为设备(*.dc)文件。为此，用户必须在Trimble 数据传输功能中安装一测量控制器设备。

注：如果某些工程与Trimble GPS原始数据(*.dat)文件相关，那么这些.dat文件要和工程一起导入。如果用户多次导入一个.dat文件到同一项目，项目中存在的选项不能被DAT 校对对话框.默认选择。

在导入一个.dc文件时，Trimble Geomatics Office用分配给Trimble Survey Controller中的每一个点种类 和决定点的位置方法来分配每一个点到点的质量。验算时用质量来计算点的位置。

注：如果用户使用测量控制器7.60版本进行数据的传入传出，请使用7.5 dc版本的文件格式。如果用户使用测量控制器7.5版本进行数据的传入传出，请使用7.6 dc版本的文件格式。


注释记录 - 概述

项目中的注释是用户从Trimble Survey Controller中输入的注释。没有诸如“初始化获得”和“初始化丢失”之类的测量信息注释放在项目中。

用在Trimble Survey Controller中注释目录有以下目的：

如果用户使用老版本的Trimble Survey Controller，并且希望应用注释记录，选择选择/根据类型对话框，选择项目中所有的注释记录。


Sokkia数据记录文件(*.sdr)

Trimble Geomatics Office支持Sokkia Data Recorder文件(*.sdr)格式的文件。

用Trimble Geomatics Office，用户可以：

  导入 一个 Sokkia Data Recorder 文件 (*.sdr)到一项 Trimble Geomatics Office 工程。

  导出Trimble Geomatics Office工程到Sokkia Data Recorder 文件 (*.sdr)。

导入一个Sokkia Data Recorder 文件 (*.sdr)：

1.	选文件/导入。弹出导入对话框。

2.	选测量列表。

3.	选SDR文件 (*.sdr) 选项，弹出打开对话框。

4.    从用户希望导入的一个文件夹中选择文件，点击打开。

导出当前 Trimble Geomatics Office 项目到一个 Sokkia Data Recorder文件(*.sdr)。

1.	选文件/ 导出。 弹出导出对话框。

2.	选测量列表。

3.	选 Sokkia Data Recorder 文件 (*.sdr) 选项。

4.	点击选项，打开设备选项对话框，指定文件内部名称和 Sokkia Data Recorder 文件版本。

5.	点击确定，接受当前设置，返回导出对话框。

6.	点击确定。另存为对话框出现。


传输英国国家网格文件到Trimble Survey Controller

 如何做...

用Trimble 数据传输功能直接传输英国国家网格项目网格文件(*.pgf)到Trimble Survey Controller7.5或更高版本。

用户可以传输在Program Files\Common Files\Trimble\Geodata文件夹下的任何已有.pgf文件。

注：该选项只在运行“Trimble数据传输功能”独立模式时有效。该选项在Trimble Geomatics Office导出对话框下无效。


域填充 - 概述

更多信息

 帮助 ...

概述

域填充用于域内输入数值。例如，可以通过点击所需图层中的某点来填充此图层。

在支持域填充的域中，图形窗户中的指针显示为：

注 ：如果图形窗口中所选实体不能提供域所要求的值，则对话框中该域内数值保持不变。

某些域以某组值填充。点击可填充所有组的域。例如，北向,东向和高程域通常形成一个组。若只要填充单个域,可选择它并按下Alt键然后点击鼠标。

Trimble Geomatics Office的输入焦点在域填充后转移到下一个没有输入的域。

特殊域填充的用途

域填充有下列特殊的用途：

  当完成一个方位角域时，可输入相反的方位角值，按下Shift 键点击。当利用方位角和距离要素增加点时 ，对于方位角域不能使用域填充 。

  若只要选择坐标，可在使用域填充时按下Ctrl键，以避免牵扯到实体。此项可选择靠近实体的坐标。

  使用浏览菜单命令(例如放大和平移)对实体进行定位，这些实体具有填充操作所需要的数值。一旦定位，在复制数值前，必须使焦点返回到先前的域。


输入角度

小数点右边的数字按顺序解释为角度，单位，格式设置。

设置格式，请使用项目属性对话框中的单位和格式。

例如：

输入数字 10.1234


单位转换

对含有单位的域(也就是屏幕显示，导入，导输出和报告)设置显示单位，可使用项目属性对话框中的单位和格式 。

任何输入到域的数字值，可被翻译成系统为数值所设定的单位。例如，若将高程单位设置为米，则任何输入到高程域的数字的单位也为米。

可以不用此设置，而直接在数字后面输入字母单位。

系统可用指定的单位输入其它的数值。例如，如果输入高程为“25 sft”，则 Trimble Geomatics Office software 软件则识别出单位(美国测量英尺)并且给出适当地转换。

下列表格构画出应用于这个特征的值：


拖拉实体

若用鼠标移动或旋转选择的实体， 可用编辑手柄。

例如，可以改变注解的位置，以更好地显示所含信息，并改善主体图形窗口的布局。

文本/注释

拖动文本或注释实体，选择文本，注释或都选。文本框上移动鼠标指针，进行手柄定位（任何一个）。在把鼠标指针放在手柄上时，指针将改变为某个适当图标。拖动指针可以移动实体。旋转指针可以旋转实体。

例如：

选择所要求编辑的句柄，然后拖动。释放鼠标按钮时其位置被固定。

注 ：除非锚点类型处于右手位置，否则旋转手柄将定位在右上方位置。同样地，在选择右手锚点类型，旋转手柄将在左上方的位置。

编辑句柄可定位在以下位置：

注：基线指明，字母的最底位置未包括小写字母。(即，从底部到基线的空间用于小写字母的定位)。

曲线

改变曲线的进入切线或退出切线，可选择某曲线，将鼠标指针移动到曲线上，并且定位旋转手柄。每条曲线有两个手柄（进入切线手柄和退出手柄）。

当把指针放在编辑手柄上时，鼠标指针将变化为 [image] 。

旋转指针可以旋转所选曲线或曲线族。

注意：对于两条相交曲线,可以使用一个编辑手柄来进行两条曲线的旋转。 Trimble  Geomatics Office会设置并自动地对两条相交曲线提供公共的切线。

断开存在的实体，按下Ctrl. 键。缺省的，断开存在的实体是关闭的。

点

移动一个点构成数据库点的一个简单的翻译。移动一个选择的点或点，选择一个点,在点上移动指针并且定位编辑柄。当把指针放在柄上时指针改变成 [image] 。当点在需要的地点时，释放按钮。移动点和文本对话框 显示。使用这个对话框编辑确定值。

拖动点引起所有选择的点和文本移动。


无名点

在项目内，每个实体的记录采用唯一的句柄。句柄唯一的整数值，Trimble Geomatics Office采用它来识别各点。这意味着即使一个点没有被给出名称，Trimble Geomatics Office仍可由它的内部句柄进行点的识别。

当没有被给出名称的某点需要某个名称时(例如，在增加点对话框中选择了结束点时)，将显示点的当前的数据库句柄。点名称前将加上等号(=)字符， 这是软件识别所选点的方法。


状态栏

状态栏位于图形窗口的底部。它显示软件的当前状态信息，包括坐标信息。

当在视图时间区域移动鼠标时，状态栏将给出时间信息。它可以给出 Windows本地的时间或 GPS的星期/秒，这取决于时间选项中设置。

当Trimble Geomatics Office正在执行某个任务时，例如基线处理，状态栏变为进度指示器。

为了获得状态栏指示器的更多的信息，请参照Trimble Geomatics Office用户指南。


状态栏 - 窗口的四角

窗口的四角可以缩放到主要的图形窗口大小。


进度指示器

当Trimble Geomatics Office正在执行某个任务时，状态栏显示进度指示器的进度。

用一条状图显示任务完成的百分比。

通过显示点击Esc 取消信息，任务可以中断。当这出现时，点击Esc 结束这项任务。如果不显示出这条信息，任务将不能被中断。


恢复命令

使用此命令使激活的窗口恢复到原来的大小和位置。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office 按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单栏上点击系统按钮 [image] 。

打开系统菜单。

2.	从系统菜单选择恢复命令。


移动命令

使用这个命令显示一个4头箭头，利用它可以移动激活的窗口或对话框。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office 按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单栏点击系统按钮 [image] 。

打开系统菜单。

2.	从系统菜单选择移动。

注 ：如果最大化了窗口，这个命令将无法使用。


尺寸命令

使用这个命令显示一个4头箭头，利用它可以改变激活的窗口的尺寸。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office 按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单条栏点击系统按钮 [image] 。

系统菜单打开。

2.	从系统菜单选择大小。

当指针改变成4头箭头以后：

1.	按下一个方向键(左、右、上、下箭头)，移动指针到需要移动的边界。

2.	按下一个方向移动边界。

3.	当窗口是所需要的尺寸时，按回车键。

注 ：如果你最大化窗户，这个命令就无法使用。


最小化命令

使用这个命令将 Trimble Geomatics Office窗口最小化变成图标。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office 按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单条栏点击系统按钮 [image] 。

打开系统菜单。

2.	从系统菜单选择最小化。


最大化命令

使用这个命令最大化激活的窗口充满可利用的空间。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office 按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单条栏点击系统按钮 [image] 。

打开系统菜单。

2.	从系统菜单选择最大化。


关闭命令

使用这个命令关闭激活的窗户或对话框。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单条栏点击系统按钮 [image] 。

系统菜单打开。

2.	从系统菜单选择关闭。


下一个命令

使用这个命令根据图形窗口打开的顺序切换到下一个图形窗口。

访问此功能：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office 按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单条栏点击系统按钮 [image] 。

打开系统菜单。

2.	从系统菜单选择下一个。


前一个命令

使用这个命令根据图形窗口打开的顺序，切换到前一个图形窗口。

访问此功能可以：

1.	做下列之一：

  在标题栏上点击Trimble Geomatics Office按钮 [image] 。

  在标题栏上点击鼠标右键。

  在菜单条栏点击系统按钮 [image] 。

打开系统菜单。

2.	从系统菜单选择前一个。


切换命令

使用这个命令显示所有启动的应用程序列表。

使用任务列表选项，切换或结束列表上应用程序。

对话框选择

当选择切换命令时，就会打开一个含有下列选项的对话框：

选项	描述
任务列表	选择想要打开或结束的应用程序.
切换	激活所选择的应用程序.
结束任务	结束所选择的应用程序.
取消	结束任务列表选项.
层叠	安排打开的应用程序，使得它们层叠，并可看到每个窗口的标题栏。这个选项不影响变为图标的应用程序.
并列	安排打开的应用程序，使得它们并列，并可看到每个标题栏。这个选项不影响变为图标的应用程序。
排列图标	在屏幕的底部排列所有最小化的应用程序的图标.


拖放文件到 Trimble Geomatics Office

概述和更多信息	帮助 ...

使用 Windows 资源管理器和 Microsoft Windows “拖放”功能从计算机上的某文件夹中导入数据文件到Trimble Geomatics Office的项目中。

可以导入任何导入对话框可利用的文件。

 注释：不能从PC卡中拖放 .job 或 .raw 文件到 Trimble  Geomatics Office项目中。应将这些文件传输到 Trimble  Geomatics Office 项目文件夹中 ，使用Trimble  Geomatics Office传输功能传输这些文件。这个软件将会将文件转换到正确的格式。

单一格式

可以使用鼠标按钮拖放文件。

当释放时，使用鼠标的右键按钮总是会更安全：

  拖动鼠标的右键按钮以后，显示一可利用的导入格式的列表。 可以从列表选择正确的格式。

  拖动鼠标的左键按钮以后，Trimble Geomatics Office使用文件的扩展性确定正在导入的文件格式。正确的文件格式被软件选择是没有保证的。

多重格式

可以使用任何一个鼠标按钮拖放多重文件。

  使用鼠标的右键按钮，可以拖放同一类型的多重文件。从显示的可利用的正确能选择正确的格式导入。如果拖放选择的不同的文件类型 (例如一个 .dc 文件和一个 .dat 文件),单独的导入选项不在列表中出现。从列表中选择缺省的每个文件类型使用的导入选项。 Trimble Geomatics Office使用文件的延期并且决定你正在进口的文件格式 。Trimble Geomatics Office使用文件的扩展性确定正在导入的文件格式 。然而 ,没有保证正确的文件格式将被软件选择.

  使用鼠标的左键按钮，可以拖放不同类型的多重文件。Trimble Geomatics Office使用文件的扩展性确定正在导入的文件格式 。然而,没有保证正确的文件格式将被软件选择。

注释 ：如果 Trimble Geomatics Office不识别通过“拖放”导入的格式，则快捷键菜单就会出现 ，给出选项：即将它作为第三方数据记录文件或某 NMEA 文件导入。如果选择缺省选项， Trimble Geomatics Office将试图以NMEA 文件方式导入。

通用格式

当使用鼠标的右键按钮拖放一个文件到 Trimble Geomatics Office 项目时，任何生成的通用的导入格式出现在快捷键菜单中。

提示 ：如果没有打开项目，可以拖动选项 .ini 文件到 Trimble Geomatics Office中，以打开此项目。


快捷键菜单

快捷键菜单是与上下文相关的菜单，它的变化取决于鼠标指针放的位置。

可以使用快捷键菜单执行通用的任务，例如：

  通常访问使用过的菜单命令和对话框

  切换显示设置

 插入域代码

访问快捷键菜单：

1.	把指针放在适当的区域上。

2.	点击鼠标的右键按钮。


热键

热键提供访问菜单或对话框选项的，使用键盘的快速途径。

在键盘上按下与要选择项中含有下划线的字母相对应的键即可。


坐标系统 - 概述

更多信息

如何做 ...	对话框	也请参见
概述

Trimble Geomatics Office 使用一套坐标系统将曲面（地球）度量值转换成平面（地图或平面图）度量值。例如，坐标系统用于计算由 GPS 测出的点的网格坐标（GPS 度量值是在 WGS-84 椭球上得到的）。

坐标系统由下列元素组成：

 基准转换 (WGS-84 椭球与地方椭球之间转换)

 投影

 大地水准面模型

 GPS 点校正 (由水平平差和垂直平差组成)

必须为每个项目选择一个坐标系统。或者，如果您没有坐标系统（或不知道该选哪一个系统），使用缺省投影。

注： 要根据所使用投影的属性，确认项目中的点是在到投影原点的合理距离之内。

坐标系统数据库

坐标系统数据库被存储为叫作当前.csd的文件，它包含全部的坐标系统信息。 Trimble 提供了世界各地公布的各种坐标系统。要定义或编辑坐标系统、区域、站点、基准转换、椭球和大地水准面模型，使用 Trimble 坐标系统管理器� 应用程序。

选择坐标系统

为项目选择一个坐标系统，使用下列方法之一：

  坐标系统数据库中的坐标系统和区域

  坐标系统数据库中的一个站点

  未经定义的缺省投影

  定义的缺省投影

  在导入过程中指定在测量控制器 (*.dc) 文件中坐标系统

当您在 Trimble Geomatics Office 软件中选择坐标系统时，参数将从该坐标系统数据库获得。

改变项目的坐标系统

要改变项目的坐标系统，进行如下操作之一：

  使用项目属性对话框指定一个新坐标系统。

  将带有不同坐标系统的测量控制器(*.dc) 文件导入到 Trimble Geomatics Office 项目中。即：如果项目有一套坐标系统，而 .dc 文件有另外一套坐标系统，则在导入过程中软件会检查出坐标系统的不同，并选择要使用哪一套系统。这是当您选择使用 .dc 文件的坐标系统时，改变项目坐标系统的方法。

当改变项目的坐标系统时，Trimble Geomatics Officer将计算所有点的坐标，使它们从旧坐标系统转换到新坐标系统。这种转换的一般过程如下：

1.	所有坐标被减小到椭球上。（通常椭球为 WGS-84 椭球，但当只改变投影时，它是局部椭球。）

2.	用新参数计算新坐标。

这些步骤在下列图表中示出：

如果大地水准面模型或垂直平差是旧坐标系统的一部分，它将被用来计算所有不是从现场观测值导出的点的 WGS-84 高度。类似地，如果大地水准面模型或垂直平差被用于新坐标系统，它用来从 WGS-84 高度计算网格坐标的新高程。

改变坐标系统对 RoadLink 和 DTMLink 的影响

当您从项目把点导出到 Trimble RoadLink� 或 Trimble DTMLink� 中时，导出的点不会被后续的改变更新到 Trimble Geomatics Office 项目中去。

Trimble 建议您在确实完成了 Trimble Geomatics Office 项目的所有改变之后，再将点导出。

如果您已经从 Trimble Geomatics Office 项目将点导出到了 Trimble Roadlink 或 Trimble DTMLink中，并在 Trimble Geomatics Office 项目中改变了坐标系统或调校了数据，下述警告将会出现：

当您改变该坐标系统时，DTMLink 和 RoadLink 点的坐标将不被更新。

执行下述操作之一：

  点击确认，接受 Trimble RoadLink 或 Trimble DTMLink 中点坐标将不改变的事实。

  点击取消，取消该改变。

为确保 Trimble RoadLink 或 Trimble DTMLink 中使用的是最新坐标：

1.	在 Trimble RoadLink 和/或 Trimble DTMLink 中删除不想要的点。

从 Trimble Geomatics Office项目中再次导出这些点。


地面坐标系统

如果需要的坐标为地面坐标而不是投影坐标，应使用地面坐标系统。当选择地面坐标系统时，网格距离与地面距离相等。

在 Trimble Geomatics Office 中使用地面坐标，您需要：

1.	为该项目定义一套坐标系统。

为项目位置输入坐标。 项目位置被保存为当地经纬度。

输入地面比例因子，或利用项目位置坐标加以计算。

为项目定义坐标系统

有关如何在 Trimble Geomatics Office 项目中选择和改变坐标系统的信息，请参见坐标系统 - 概述主题。

为项目位置输入坐标

步骤如下：

1.	选择文件 / 项目属性。项目属性对话框出现。

2.	选择坐标系统标签。

3.	在地方站点设置组中，点击改变。地方站点设置对话框出现。

在项目位置组中，输入适当坐标。 如果坐标系统未定义，您将会被要求更新坐标系统。

经度、纬度和高程估计必须是合理的估计，所以应输入该项目的平均高程。

地面比例因子

步骤如下：

1.	在地方站点设置对话框中，选择使用地面坐标检查框，并执行下述操作之一：

  输入地面比例因子。

  从项目位置检查框中选择计算比例因子。软件将从项目位置组的数值中计算地面比例因子。

  确定地面坐标的显示方式。您可以指定北向和/或东向偏差，或者四位或五位数字坐标。使用这个选项可容易地对坐标加以区别。

注： 地面坐标系统假定您在项目位置附近工作，并且项目高度变化不大。

地面比例因子由下述步骤计算：

1.	确定参照高程 (h)

2.	计算高程因子

其中：

R 为椭球半径

h 为参照高程

a 为主半轴

e2 为离心率平方

φ 为投影原点纬度

3. 	在项目位置计算项目中心的地面比例因子。

其中：

s 为项目位置的网格比例因子

在Trimble Survey Controller版本10中，大地坐标系统被全面支持。以下注释处理Trimble Survey Controller 版本7.7及其以下版本中的大地坐标系统。

注：

从 Trimble Survey Controller 版本7.5 � 7.7中导入带有地面坐标的项目

如果导入带有已经定义了比例因子的Transverse Mercator 投影的 Trimble Survey Controller (版本 7.5或7.7)工作（例如，带有校正的无投影/无基准工作），则应让地方站点设置对话框中的使用地面坐标检查框为空白。否则地面比例因子将被应用两次。

当您将带有地面比例因子的 Trimble Survey Controller 工作导入到一个没有定义地面坐标系统的 Trimble Geomatics Office 项目中时，警告信息将会显示，它告知您该工作和坐标系统项目中的不同。这时，应使用 Trimble Geomatics Office 项目中的坐标系统，然后在地方点设置对话框里选择使用地面坐标检查框。

将带有地面坐标的项目导出到 Trimble Survey Controller 版本7.5 � 7.7中

如果您将带有在 Trimble Survey Controller (版本 7.7或更低) 中定义了地面坐标的 Trimble Geomatics Office 项目导出，该坐标系统将与您再次导入到 Trimble Geomatics Office 的坐标不同。应确保您接受了 Trimble Geomatics Office 坐标系统。

Trimble Survey Controller (版本 7.7或更低) 不支持带有 Lambert Conformal Conic 2 平行投影的地面坐标。坐标系统应从 Trimble Geomatics Office 导出到带有 Lambert Conformal Conic One Parallel 投影的 Trimble Survey Controller 中。

Trimble Survey Controller (版本 7.7或更低) 不支持带有 Albers 等面积锥投影的地面坐标。如果您想导出带有在 Trimble Survey Controller 软件中定义了 Albers 等面积锥投影的项目，应去除地面坐标或改变投影。


基准转换－概述
基准转换 - 概述

更多信息

 也请参见

概述

基准转换是用来从一个椭球（例如 WGS-84 椭球）的坐标转换到地方椭球（地方椭球是投影所使用的椭球）坐标的一套参数。 基准转换是坐标系统定义的一部分。

可使用的基准转换方法如下：

  Molodensky（三参数）

  七参数

  基准网格

  多重回归

所有转换方法都存储在坐标系统数据库中。

要想定义新的基准转换，应使用 Trimble Coordinate System Manager�应用程序 编辑坐标系统数据库。


基准转换 - Molodensky (三参数)

 概述及更多信息

Molodensky 基准转换定义了从 WGS-84 椭球原点到地方椭球原点（反之亦然）X、Y、Z 方向的一种转换。

Molodensky 基准转换有时也被称为三参数基准转换。

查看细节

如果在项目中，Molodensky 基准转换定义为坐标系统中的一部分，您可以查看转换值。

查看时使用坐标系统细节对话框。

这些域定义一种从 WGS-84 椭球原点到地方椭球原点的三维直角坐标 (X, Y, Z) 转换。

基准转换存储在坐标系统数据库 (当前.csd) 中。要想进行编辑，应使用 Trimble Coordinate System Manager�程序。


基准转换 - 七参数

 概述及更多信息

七参数基准转换定义了从 WGS-84 椭球到地方椭球、或从地方椭球到 WGS-84 椭球的转换。

平移

这些域定义了从 WGS-84 椭球原点到地方椭球原点的三维直角坐标 (X, Y, Z) 转换。

旋转

旋转 X 值分别定义了绕 X、Y、Z 轴的旋转角。它们是 WGS-84 椭球必须旋转到与地方椭球对应轴对齐的角度。

从轴的正方向看，逆时针方向的旋转角度为正角度。

比例因子

它是以百万分之一定义的、被所有坐标相乘的系数。如果比例因子是6.02，则所有坐标均应乘以 1.00000602。

查看细节

如果在项目中，七参数基准转换定义为坐标系统中一部分，您可以查看基准转换值。

查看时使用坐标系统细节对话框 - 基准转换标签。

基准转换存储在坐标系统数据库 (当前.csd) 中。要想进行编辑，应使用 Trimble Coordinate System Manager� 程序。


基准转换 - 基准网格

 概述及更多信息

基准网格基准转换是一种包含有区域基准转换参数的公布文件。该文件用来在您的位置处插入基准转换值。

要想将基准网格用作项目系统定义的一部分，您必须选择一个由纬度和经度基准网格 (*.dgf) 文件定义的基准转换。

如果要用基准网格文件查看或创建一套基准转换，应使用Trimble Coordinate System Manager� 程序。

如果要在域中使用基准网格文件，您需要将基准网格文件作为组合基准网格文件传输到 Trimble Survey Controller 中（版本 7.00 或更高）。


基准转换－多重回归
基准转换 - 多重回归

 概述及更多信息

多重回归基准转换应用本地区预设平移的多项式方程拟合，定义了一种 WGS-84 椭球和地方椭球之间的基准转换。要想增加多重回归基准转换，使用 Trimble Coordinate System Manager� 程序。

查看细节

如果您已将多重回归基准转换定义成项目坐标系统的一部分，便可以查看基准转换值。

使用坐标系统细节对话框 - 基准转换标签进行查看。

基准转换存储在坐标系统数据库 (当前.csd) 中。要想进行编辑，应使用 Trimble Coordinate System Manager� 程序。


投影－概述
投影 - 概述

更多信息

 也请参见

概述

投影是椭球曲面在直角坐标网格上的一种数学表示。

使用投影可将地方椭球坐标转换成地方网格坐标。

网格坐标是用来制作表示地球表面或其部分地图的网格。

不同国家和地区使用不同的投影来达到网格坐标最小畸变的结果。Trimble Coordinate System Manager� 程序包含大量的投影（例如，Transverse Mercator 和 Lambert One Parallel ）。要得到特定投影的详细资料，参见 Trimble 坐标系统管理器程序帮助。

注：要确认项目中点与投影原点的距离符合所使用投影的属性。

使用 Trimble Coordinate System Manager�  程序，把投影参数定义为坐标系统定义的一部分。


大地水准面模型 - 概述

更多信息

 也请参见

概述

大地水准面是常量地球引力位势曲面，约为海平面。

用 GPS 观测的点具有基于 WGS-84 椭球的高度，这些高度被称为椭球高度。

大地水准面模型使我们能够用椭球高度来估计高程。

大地水准面模型存储为大地水准面网格 (*.ggf) 文件。.ggf 文件包含网格上某些点的大地水准面差距，可对任何网格内的点计算这些大地水准面差距。

当对每个由 GPS观测的点选择了一个大地水准面模型后， Trimble Geomatics Office 将使用 .ggf 文件在该位置插入大地水准面差距(N)。然后从观测到的椭球高度 (h) 中减去或加上其值。 这给出 GPS 点的海平面以上高程的估计值。大地水准面和地方椭球之间的关系如下图所示：

要想使用现有大地水准面文件来定义一个新的大地水准面模型，应使用 Trimble Coordinate System Manager� 程序。当您为某项目选择一套坐标系统时，坐标系统数据库中的所有大地水准面模型都可以使用。

您可用 Trimble Geomatics Office 将大地水准面模型导出到Trimble Survey Controller或TDS Survey Pro CE 软件 (版本3.5或更高)，并创建现有大地水准面网格文件的子网格。

注: 如果不使用大地水准面模型或不进行 GPS 站点校正，某点的高程将与椭球高度相同，而不是真正的高程。 如果大地水准面模型被用于投影坐标系统中，则它被用来对所有的点类型进行地方椭球高度和高程之间的转换，而不仅仅是对 GPS 而言。


改变坐标系统－选择坐标系统对话框
改变坐标系统 - 选择坐标系统对话框

使用本对话框来选择一个现有系统、站点，或为项目定义一个缺省投影。

这个对话框是指引您进行选择设置的第一步向导。

在选择对话框中，点击下一步向前移动或点击返回向后移动。

Trimble Geomatics Office 使用坐标系统数据库文件(当前.csd)中的坐标系统。您可使用 Trimble Coordinate System Manager� 程序编辑参数。

新系统

要想选择一个已存放在坐标系统数据库中或缺省投影中的新坐标系统和区域：

1.	选择新系统。

2.	点击下一步到坐标选择系统类型对话框。

3.	使用向导来选择项目的坐标系统。

最近使用过的系统

要想从最近使用过的十个坐标系统列表中选择一个坐标系统：

1.	点击最近使用过的系统。

2.	点击箭头钮并在您的系统总结中滚动。

3.	选择您希望用在项目中的坐标系统。

4.	点击完成。

注：如果您第一次使用坐标系统数据库，选择坐标系统类型对话框（而不是改变坐标系统 - 选择坐标系统对话框）将会出现。这是由于没有最近使用过的系统可被选择的缘故。

注：Trimble Geomatics Office 只支持坐标系统管理器程序中的部分坐标系统。如果所选的系统不被支持，将出现下述信息：

未知坐标系统类型


选择坐标系统类型对话框

使用本对话框来选择您想使用的坐标系统类型。

坐标系统和区域

选择这一选项来从您的坐标系统数据库中挑选一个坐标系统。

已校正的站点

选择这一选项来挑选您以前存放到坐标系统数据库中校正过的站点。站点被存储在地方站点的坐标系统细节中，它可能包括 GPS 校正参数。

缺省投影 (Transverse Mercator)

选择本选项来定义缺省投影。

返回

点击返回将返回到选择坐标系统对话框。

注：如果这是您第一次使用坐标系统数据库，则返回不能用。

下一步

点击下一步。根据您选择的不同选项，下列对话框之一出现：

  选择坐标系统区域对话框。

  选择已校正的站点对话框。

  缺省投影（Transverse Mercator) 对话框。


选择坐标系统区域对话框

使用本对话框来从坐标系统数据库的可用坐标系统列表中为项目选择坐标系统。

要查看某坐标系统组或区域的属性：

1.	突出显示坐标系统组或区域。

2.	点击鼠标右键来得到快捷菜单并选择属性。

坐标系统组

本列表包含坐标系统数据库的坐标系统。一个系统包含一个或多个已经为不同地区定义的区域。

区域

本列表包含选择过的坐标系统的可用区域。一个区域包含基准转换（包括一个椭球和一系列从 WGS-84 椭球到地方椭球的转换参数）、大地水准面模型和投影参数。

返回

点击返回，返回到选择坐标系统类型对话框。

下一步

点击下一步。选择大地水准面模型对话框出现。


选择已校正的站点对话框

使用本对话框来从坐标系统数据库中可用的已校正站点中选择一个校正过的站点。站点存储在坐标系统数据库中。您可以在 Trimble Coordinate System Manager�程序或 Trimble Geomatics Office（在文件 / 项目属性 / 坐标系统标签或测量 / GPS 站点校正中）中创建站点。

要查看站点属性：

1.	突出显示站点名。

2.	点击鼠标右键来得到快捷菜单并选择属性。

站点细节

这个组示出了突出显示的站点的基准转换和大地水准面模型。

返回

点击返回，返回到选择坐标系统类型对话框 。

完成

点击完成来结束坐标系统定义并返回到项目属性对话框。您选择的站点定义是项目的坐标系统。

注：不能在 Trimble Geomatics Office 中对一个站点改变大地水准面模型。大地水准面模型是为使用的站点特定的。要想改变站点的大地水准面模型，应使用 Trimble Coordinate System Manager 程序。 该程序允许您对站点进行编辑。


缺省投影（Transverse Mercator）对话框

使用这个对话框来设定缺省投影参数。 Trimble Geomatics Office 可计算这些数值，您也可以用键盘输入这些数值。

自动计算投影参数

选择本检查框来配置 Trimble Geomatics Office，使它自动把第一个输入到项目中的 WGS-84 位置用作原点，并且用第一个网格坐标（北向和东向）来计算假北和假东。

注： 您必须设定南方位角系统（如果需要的话）和正坐标方向。 Trimble Geomatics Office 并不自动更新这些域。

清除该检查框来输入投影参数。对话框中的下述域将可以使用。在这些域中输入数值。

中心纬度

输入投影原点的纬度。

中心经度

输入投影原点的经度。

假北和假东

为缺省投影输入假北和假东。假北和假东为缺省投影原点的网格坐标。

比例因子

为原点输入比例因子。它应当是投影的已知比例因子。这表示投影距离与地球表面距离的比率。所有地面坐标均由此值压缩或放大而给出网格距离。

南方位角系统

选择本域设定一个南方位角系统。南方位角系统利用正南方向作为零方位角。它被夏威夷和南非使用（其它系统使用正北作为零方位角）。

正坐标方向

选择本位置来设定您希望坐标值增加的方向。

返回

点击返回可返回到选择坐标系统类型对话框。

下一步

操作完成后，点击下一步。 选择大地水准面模型对话框出现。


选择大地水准面模型对话框

使用本对话框来为项目选择大地水准面模型。如果大地水准面模型是在坐标系统数据库中为坐标系统所定义的，它会被自动选择。

大地水准面模型 是由大地水准面/椭球差距构成的一个数学曲面。它是 WGS-84 椭球与平均海平面分离度的一个估计。大地水准面模型用于导出 GPS 点的正交高度近似值。

无大地水准面模型

选择本选项为坐标系统设置无大地水准面模型。如果您不设置一个大地水准面模型，则点的高程为其在地方椭球上的高度。

如果选择本选项，Trimble 建议您执行 GPS 点校正 ，以便为您的 GPS 观测得到更精确的高程。

预定义大地水准面模型

要想为项目指定一个大地水准面模型，从给出的列表中选择一个。大地水准面模型列表是从坐标系统数据库 (当前.csd) 中得到的。

根据大地水准面模型的精确度不同，由 WGS-84 高度和大地水准面分离度导出的高程被赋予一个质量。要想指定大地水准面模型，使用项目属性对话框 / 重新计算标签 中的大地水准面模型质量域。该质量用于确定点的高程域质量。

返回

点击返回可返回到选择坐标系统区对话框 或缺省投影 (横向 Mercator) 对话框 。

完成

点击完成可结束坐标系统定义，并返回到项目属性对话框。


站点－概述
站点 - 概述

站点常用于存储基于现有坐标系统和区域的当地 GPS 站点校正细节。

当已进行了 GPS 站点校正后，您可以将其作为站点存储到坐标系统数据库中的坐标系统中，以便再次使用。

要存储站点，执行下述操作之一：

  选择测量 / GPS站点校正。

  选择文件 / 项目属性 / 坐标系统标签。

您也可以使用 Trimble 坐标系统管理器�程序创建一个新站点。当使用这一功能时，存储的站点将显示在站点标签上。

参见 Trimble Coordinate System Manager 程序帮助来了解更多信息。

注：您不能将调整转换参数作为站点存储。


使用未定义的缺省投影－概述 / 缺省投影定义对话框
使用未定义的缺省投影 - 概述 / 缺省投影定义对话框

概述

未经定义的缺省投影是不带原点经纬度值的缺省投影。当您第一次使用未经定义缺省投影将测量数据输入到项目中时，缺省投影定义对话框出现。缺省投影定义对话框会建议您使用适合于您输入数据的投影参数。根据添加到项目中数据类型的不同，对话框中会出现不同的域。下面是几种可能的情况：

  增加 GPS 点到包含网格点的项目（未定义的缺省投影）中。

  已定义投影的文件到未定义投影的项目中。

  增加 WGS-84 点到项目中 (未定义投影) 中。

  使用只比例因子文件 (未定义投影)。

  增加网格点到空项目中。

要想使用未经定义的缺省投影，应使用没有定义坐标系统的项目模板（例如 Trimble Metric 和 US Feet 模板）。


增加网格点（未定义的缺省投影）

 概述及更多信息

当把第一个位置增加到未定义的缺省投影（没有坐标系统）作为网格位置的 Trimble Geomatics Office 项目中时，缺省投影定义对话框出现。

缺省投影定义对话框包含下述域：

假北

投影原点的北向。该北方向值由文件中的第一个点导出。您可以改变此值。

假东

投影原点的东向。该东方向值由文件中的第一个点导出。您可以改变此值。

确认

点击确认，接受缺省投影参数。这些值用于确定项目的坐标系统。要想查看这些参数，选择文件 / 项目属性/ 坐标系统标签，然后点击细节。

注：因为您的缺省投影还没有完全定义（原点经纬度尚未定义），您可以用导入一个含由一个或多个 GPS 点的文件的方法来进行更新。


增加 GPS 点到包含网格点的项目中（未定义的缺省投影）

 概述及更多信息

当 Trimble Geomatics Office 项目具有未经定义的缺省投影（没有原点经纬度）时，缺省投影定义对话框出现，它包含一个或多个网格位置，并且：

  一个包含至少一个 GPS 点的文件被导入。

或

  一个 WGS-84 点被键入。

缺省投影定义对话框包含下列域：

北向

此域为空域。为 GPS 点输入所知道的最佳北向坐标，以定义缺省投影。

东向

此域为空域。为 GPS 点输入所知道的最佳东向坐标，以定义缺省投影。

纬度

文件中第一个 GPS 点的 WGS-84 纬度在此显示。此域不可用。

经度

文件中第一个 GPS 点的 WGS-84 经度在此显示。此域不可用。

确认

点击确认接受为该 GPS 点设置的网格坐标。 WGS-84 原点的纬度值和经度值按照原点的伪坐标值（已经定义）和在对话框中设定的 GPS  点的值确定。要想查看这些参数，选择 文件 / 项目属性 / 坐标系统标签，然后点击细节。

注：一旦某 GPS 点增加到数据库中后，缺省投影便完全得到定义。从现在开始，当导入一个文件或增加点到 Trimble Geomatics Office 项目时，缺省投影参数将不再更新。然而，您可以用进行 GPS 校正的方法 (选择测量 / GPS 站点校正)来更新投影原点。


增加 WGS-84 点到项目中（未定义的缺省投影）

当 Trimble Geomatics Office 项目具有未经定义的缺省投影（没有原点经纬度）时，缺省投影定义对话框出现，并且

  一个 WGS-84 点被键入

  一个 WGS-84 点被导入。

缺省投影定义对话框包含下列域：

北向

此域的缺省值为 0。为该点输入已知的最佳北向坐标，以定义缺省投影。这个值作为投影的假北。

东向

此域的缺省值为 0。为该点输入已知的最佳东向坐标，以定义缺省投影。这个值作为投影的假东。

原点纬度

该点的 WGS-84 纬度在此显示。此域为投影的原点纬度，不可用。

原点经度

该点的 WGS-84 经度在此显示。此域为投影的原点经度，不可用。

确认

点击确认接受缺省投影参数。 这些值用于确定项目的坐标系统。要想查看这些参数，选择 文件 / 项目属性 / 坐标系统标签，然后点击细节。

注：一旦缺省投影完全定义，当您导入一个 .dc 文件或增加点到 Trimble Geomatics Office 项目时，缺省投影参数将不再更新。然而，您可以用进行 GPS 校正的方法 (选择测量 / GPS 站点校正)来更新投影原点。


导入 .dc 文件（带有定义的投影）到未定义的缺省投影中
导入文件（带有定义的投影）到未定义的缺省投影中

 概述及更多信息

项目的坐标系统会自动改变到文件所设定的坐标系统。

一条信息将被写入到导入报告中，内容如下：

“导入的坐标系统与项目的坐标系统不同。导入的定义作为首选被用于未经定义的缺省(横向 Mercator)投影中。”


使用文件的坐标系统
使用来自文件的坐标系统

 概述及更多信息

当用已定义的坐标系统导入文件后，在文件中记录的坐标系统定义将与项目的坐标系统进行比较。如果它们不相同，项目坐标系统对话框将出现。

要想使用文件中设定的坐标系统，在项目坐标系统对话框中选择转换到数据采集器定义选项。

如果文件中设定的坐标系统不是只比例因子坐标系统，项目坐标系统将变成文件中设定的坐标系统。

如果文件中的坐标系统为只比例因子，则出现什么情况将取决于为项目定义的坐标系统。

注：如果项目坐标系统是一个未经定义的缺省投影且没有点，则文件中的坐标系统将被自动使用，且项目的坐标系统将改变成文件中的坐标系统。


带有无定义坐标系统的全站仪文件 (只比例因子) - 概述

概述

只比例因子坐标系统可以用于观测值由常规仪器（即没有 GPS 测量值）获得的测量中。

Trimble Geomatics Office处理的只包含地面观测值文件的方法取决于 Trimble Geomatics Office项目中定义的坐标系统。

未定义的缺省投影

如果 Trimble Geomatics Office 项目有未经定义的缺省投影（没有原点经纬度），缺省投影对话框出现。您可以输入假北、假东和比例值。

警告：如果数据库中已存在一个点，文件的比例将不会被用来更新缺省投影。应确认已导入文件中的比例和项目缺省投影的比例一致。

已定义的坐标系统

如果 Trimble Geomatics Office 项目具有已定义的坐标系统 （包括已定义了原点经纬度的缺省投影），该项目的坐标系统被使用，文件中的比例被假定为与项目坐标系统中的比例相同。


使用只比例因子 .dc 文件（未定义的缺省投影）
使用只比例因子文件（未定义的缺省投影）

 概述及更多信息

缺省投影定义对话框出现，当：

  您导入的文件包含只比例因子投影

  Trimble Geomatics Office 项目有未经定义的缺省投影（即原点的经纬度未定义）

  数据库中没有点

对话框包含下述域：

假北

北向值由文件中的第一个点导出。您可以改变假原点的这些值。

假东

东向值由文件中的第一个点导出。您可以改变假原点的这些值。

比例因子

比例因子由文件中的最后一个记录导出。您可以改变比例因子的这些值。

注：在搜索文件中的第一个点时，已删除的点不被考虑。

确认

点击确认，接受缺省投影参数。这些值用于定义项目的坐标系统。要想查看这些参数，选择文件 / 项目属性 / 坐标系统标签，然后点击细节。

注：因为您的缺省投影还没有完全定义（即原点的经纬度尚未定义），当含由一个或多个 GPS 位置的文件被导入时，缺省同样会被更新。

海水面校正将会被关闭，除非在当地站点设置对话框中选择了使用地面坐标检查框。


使用带有已定义的项目坐标系统的当地文件

如果已经为 Trimble Geomatics Office 项目定义了一个坐标系统，且导入了文件，则会出现一个信息，说明项目的原有坐标系统将被使用。然后，文件中的点被导入。

Trimble Geomatics Office 假定原有坐标系统中的项目比例和地面比例因子与文件中的比例相同。

如果在当地站点设置对话框中没有选择使用地面坐标选项，您应在导入前确认这两个比例完全相同，并且文件中的比例因子与组合比例因子相同。

如果在当地站点设置对话框中选择使用地面坐标检查框，则应确认对于正在导入的数据来说，Trimble Geomatic 中的项目高程是正确的。


项目坐标系统对话框

导入文件后本对话框出现，记录在文件中的坐标系统定义与项目的坐标系统定义不相同，并且项目坐标系统将被定义（即项目坐标系统不再是未经定义的缺省投影）的情况下，这个对话框将出现。

坐标系统

要使用文件中的坐标系统，选择转换到数据采集器定义。数据库中任何原有数据将由新的坐标系统定义加以更新。

要想保留项目坐标系统定义，选择保留原有项目定义选项。在数据采集器文件中的数据将由项目坐标系统加以解释。

要想查看这两个坐标系统的任何一个，点击细节按钮。

总结

点击总结来查看两个坐标系统的比较报告。使用该报告来检查坐标系统的完整参数，找出它们之间的不同。


在导入 .dc 文件时使用项目坐标系统对话框
在文件导入时使用项目坐标系统对话框

当导入文件时，在文件中记录的坐标系统定义将与项目的坐标系统定义加以比较。要想使用项目中设定的坐标系统，在项目坐标系统对话框中选择保留现有项目定义选项。

未定义的缺省投影

如果项目坐标系统为一个未经定义的缺省投影，更新缺省投影将会出现。文件中的第一个点被用来更新缺省投影。

其它坐标系统

文件由项目坐标系统导入。

注：如果文件中的坐标系统为只比例因子，则后面的情况取决于项目的坐标系统定义。


使用 Trimble Survey Office 或 Survey Controller 中的平面投影
使用 Trimble Survey Office 或Trimble Survey Controller 中的平面投影

Trimble Geomatics Office 将不会更新未经定义的平面投影。

如果您执行下述操作之一：

  从 Trimble Survey Office 中导出一个在 Trimble Survey Office 项目中有平面投影的 Trimble Graphics 文件 (*.tgf)

  从带有平面投影的 Trimble Survey Office 中导出一个 .dc 文件

并且将文件导入到 Trimble Geomatics Office 中，则该平面投影仍可以用于 Trimble Geomatics Office 项目中。（当项目坐标系统对话框显示时，您必须选择使用 .dc 文件坐标系统选项）。

该平面投影将成为为项目选择的坐标系统。使用项目属性对话框 / 坐标系统标签来查看坐标系统细节。


从只比例因子 (.dc) 文件（未定义的缺省投影）执行带有数据的网平差
从只比例因子文件（未定义的缺省投影）执行带有数据的网平差

大地数据文件（即没有 GPS观测值）的坐标系统可能没有定义除了比例以外的其它参数。也就是说，它没有基准转换、水平平差或垂直平差。只比例因子坐标系统在 Trimble Survey Controller ( 7.00 或更高)中创建。

您需要在执行网平差 之前定义坐标系统。因此，如果您从 Trimble Survey Controller 中将只比例因子工作导入到 Trimble Geomatics Office 中未经定义的缺省坐标系统中，该软件会要求您更新未经定义的缺省投影。

在出现的对话框中，您将需要为投影原点输入经度和纬度、以及假北和假东坐标。


地球旋转参数

如果处理 100 km 以上的基线，基线处理器把地球旋转参数用到模型杆潮汐。

这些地球旋转参数（特别是杆坐标）每周可以从类似国际GPS服务（IGS）这样的机构以（.erp文件）的形式得到。如果没有可用的基线时间 .erp文件，则可采用预测的杆坐标。

用Windows Explorer可以把全部有关的 .erp文件复制到项目文件夹下的数据文件 \ 精密星历文件夹中。需要时，基线处理器自动查看这些文件。如果找不到，则将采用预测值。

注：如果在一个以上项目中使用 .erp文件，必须复制那个文件到每个项目中。


高精度测地网络

美国州平面（US State Plane）系统的HPGN（高精度测地网络）基准网格文件是作为Trimble Geomatics Office系统安装的一部分提供的。基准网格文件存储在Trimble Common Files文件夹下（通常是程序文件\公共文件\Trimble\GeoData）。HPGN基准网格文件不可以用于美国的所有州。

给文件命名约定的网格文件是：

  两个字符状态标识符＋hpgn＋纬（纬度）或经（经度），带文件扩展.dgf。例如，加利福尼亚HPGN网格文件是Cahpgnla.dgf和Cahpgnlo.dgf。

由于Trimble Geomatics Office的坐标系统管理是基于WGS 84椭球的，HPGN基准网格（为NAD83（1986）和NAD83（HPGN）间的双向转换而设计）不能干净地拟合本坐标系统模型中。为此，也为了避免混乱，软件不给参考这些基准网格提供预定义的坐标系统定义。

您可以用适当的HPGN基准网格文件在坐标系统管理器应用程序中建立自己的基准和坐标系统定义。

方法是：

1.	参照适当的HPGN基准网格文件创建新的基准定义。

2.	采用适当的州平面投影参数并参考新创建的基准定义来创建新的坐标系统定义。

用Trimble Geomatics Office项目中的新坐标系统定义从已知的HPGN投影坐标或纬度、经度和高度值中获取NAD-83（1986）的纬度和经度值。

进行以下操作：

1.	输入HPGN值作为网格坐标；或者适当时输入本地纬度、经度和高度值。

2.	从显示的WGS-84域读取等效的NAD-83（1986）纬度和经度值。

从已知的NAD-83（1986）纬度、经度和高度值得到HPGN值，如下所述：

1.	输入已知的NAD-83（1986）纬度、经度和高度值作为WGS-84值。

2.	分别从网格或本地域读取等效的HPGN网格坐标、或纬度、经度和高度值。


新Brunswick（加拿大）坐标系统

现在，坐标系统数据库有双重立体图形投影和平均大地系统1977（ATS77）的椭球。在建立新Brunswick坐标系统之前，必须购买加拿大测地测量的基准网格和大地水准面模型。

新Brunswick（加拿大）坐标系统采用：

  椭球: ATS77

  基准: NTv2基准网格

  大地水准面: HT101

  投影: 双重立体图形:

�中心纬度: 46° 30' 00" N

�中心经度: 66° 30' 00" W

�假北: 800 000 m

�假东: 300 000 m

�比例因子: 0.999912

要创建新的Brunswick（加拿大）坐标系统：

1.	用网格工厂实用程序从加拿大测地测量购买的HT101大地水准面模型来创建大地水准面网格（*.ggf）。

2.	用网格工厂实用程序从加拿大测地测量购买的NTv2基准网格来创建基准网格（*lat.dgf，*lon.dgf）文件。

3.	用坐标系统管理器程序增加新的坐标系统。更多信息，参见坐标系统管理器程序帮助中的增加坐标系统命令主题。


术语

本术语定义了GPS和Trimble Geomatics Office 软件中常用的术语，它不包含 Microsoft Windows 或通常的计算机术语。

符号

1-sigma

A

后验误差

先验误差

AASHTO

精度

平差值

平差

平差收敛

平差基准

平差类型

代数符号

运算法则

星历

模糊度

注释

天线高度

天线相位改正

反欺骗技术(AS)

APC

自动定位

方位角

B

基站

基线

基线处理器

波特

二元变量

C

CAD式样

校正点

校正坐标

笛卡尔坐标

χ平方 测试

时钟偏差

闭合差

CMR

粗糙探测(C/A)码

代码

分量

星群

被约束

约束

控制点

常规观测值

坐标系统

关联

协方差

协方差矩阵

协方差值

当前视图

周跳

D

数据记录

数据信息

基准

基准差异

基准转换

解除关联

垂直偏差

自由度

高程增量

高度增量

ΔN ΔE ΔU

ΔX ΔY ΔZ

差分定位

DOP

多谱勒偏移

双差分

DTM

双频

E

地心地固(ECEF)

东向

高程

高程限定

椭球

椭球距离

椭球高度

元素

星历

历元

历元间隔

误差

误差椭圆

事件

F

快速静态

要素和属性库(*.fcl)文件

要素代码

域代码

最终解

固定

固定坐标

固定解

扁率

扁率反算

浮动解

自由平差

频率分布

完全约束

G

GDOP

大地方位

大地基准

地理坐标

大地水准面

大地水准面模型

大地水准面观测值

大地水准面差距

地球数学

GPS

GPS基线

GPS观测值

GPS原始数据

GPS时间

格网

格网变换

格网距离

地面距离

H

HDOP

高度测量杆

HI

柱状图

平面控制点

平面距离

平面位置

I

独立

内部约束

整周模糊度

整周搜索

消除电离层影响

电离层

电离层模拟

叠代

J

K

动态测量

已知点初始化

L

L1

L2

标签

图层

最小二乘

置信程度

显著性程度

地方椭球

地方大地坐标

地方大地平面

环闭合差

M

长轴

投影角

地图投影

平均海水面

最小约束

短轴

模拟

多路径

N

窄带

NAVDATA

网

网平差

网状态

NMEA

法线

正态分布曲线

北向

O

观测值残差

观测值

观测时间

原点

正高

OTF搜索方法

超限

超量

P

P-码

参数

奇偶性

PDOP

PDOP截止值

PDOP限定值

相位中心

相位中心模型

铅垂

点定位

后处理

PPM

精密星历

精度

PRN

概率

概值

项目

项目基准

投影

传播误差

Q

QC记录

质量验收测试

R

比率

RDOP

实时动态

直角坐标

简化方程各项

冗余

冗余数

冗余基线

冗余观测值

参考因子

参考框架

参考站

参考方差

相对误差

残差

RINEX

RMS

旋转子午线

旋转角

流动站

RTCM

RTK

S

卫星分布几何图形

标量

标量加权

比例

SDMS

选择可用性(S/A)

长半轴

短半轴

时段

装置误差

照准

sigma

单频

点校准

天空图

斜距

SNR

解算类型

标准误差

单位加权标准误差

国家平面坐标

静态(测量)

静态网

状态

随机模型

子网

超追踪

测量观测值

SV

符号和线类型

系统误差

T

τ(值)

τ指标

TDOP

地面观测值

TOW

跟踪

转换

转换参数组

转换参数

三角架

对流层改正

对流层模型

三角架对中误差

U

单变量

未知数

URA

US 国家的

美制测量尺

UTC

V

方差

方差分量估计

方差分量组

方差-协方差矩阵

VDOP

向量

垂线

垂直平差

垂直控制点

W

波

权

加权策略

权阵

WGS-84

宽带

X

X, Y, 和 Z

Y

Y-码

Z

天顶时延


1-sigma

基于平均值的标准误差。


后验误差

网平差后，用先验误差乘以单位加权标准误差（参考因子）得到的值。


 先验误差

网平差之前的观测值误差的估计值。


AASHTO

美国国家高速公路和运输专业协会（American Association of State Highway and Transportation Officials）。


精度

观测值与实际值（真值）的近似程度。


平差值

对于网平差数据应用消除误差的程序后，由观测数据（观测值）得出的值。


平差

网平差中确定改正值并将其应用到观测值的过程，其目的是减少误差。


平差收敛

当网平差在规定叠代次数内达到规定的残差允许误差或计算残差后，称为平差收敛。


平差基准

当前网平差叠代中使用的基准。Trimble Geomatics Office软件可选择投影基准或WGS-84基准。


平差类型

Trimble 缺省的和用户定义网平差设置。


代数符号

在数字之前的符号(+或-)，表示正值或负值。


运算法则

用有限的步骤解决问题的一套规则。


星历

由GPS卫星播发的数据，包括所有卫星的轨道信息、星钟改正和大气延迟参数。星历用于快速捕获SV。轨道信息是降低了精度的星历数据的子集。


模糊度

包含在一组未中断的观测值内，重建的载波相位的未知整周数。接收机可以很高的精度对无线电波（经过天线时来自卫星的电波）进行记数，但是，无法得到从开始记数时起到达卫星的波数量，此卫星和天线间的未知波长数就是模糊度，也称作整周模糊度或整周偏差。


注释

一些描述另一个数据库记录的文字。如果选择和编辑注释，使用属性视窗。如果一个注释是激活的，则只要母条目改变，该注释就能再扩展到任意域内。


天线高度

GPS天线相位中心在观测点以上的高度。

从被测点到天线上已知点所测得的不正确的天线高，在软件中由人工或自动修改为正确的垂直距离。


天线相位改正

GPS天线相位中心既不是一个自然点也不是一个固定点。GPS天线相位中心随着卫星信号的方向而改变。相位中心的变化主要取决于卫星的高度。在单机测量中，允许采用不同类型的天线来使天线相位中心位置变化模型化。当使用两个相同的天线时，天线相位中心改正不是非常重要，因为共同的误差可以消去。


反欺骗技术(AS)

允许美国国防部发送加密的Y码代替P码的技术。Y码只用于被授权的用户（主要是军方）。对于非军方用户，AS与选择可用性一起降低了GPS的整体精度。


APC

天线相位中心（Antenna Phase Center）

天线的电子中心。它通常不对应于天线的自然中心。在天线相位中心测量无线信号。

在属性窗口中，一个测点的高度可能是天线相位中心的高度。如果这个高度被指定为天线相位中心高度，那么它是天线相位中心的高度棗而不是地面高度。


自动定位

GPS接收机不考虑基准站提供的数据，只采用从卫星实时采集的数据来计算位置的操作方式。自动定位是低精度定位，由一台GPS接收机即可完成。当选择可用性有效时，产生的定位水平RMS误差可精确到±100米，当选择可用性无效时，可精确到±10-20米。又被称为绝对定位和点定位。


方位角

用于测量由平面基线和大地北方向所构成的角度的测量观测值。应用于GPS观测值时，指法截面方位。


基站

天线和接收机固定在已知位置。它用于实时动态或差分测量。基准站记录数据并用于事后处理。一个Trimble参考站，例如Trimble Reference Station (TRS)软件或Trimble Universal Reference Station (URS)软件，加上基准站接收机模式就可构成基准站。

在GPS实际测量中，可观测和计算基线（即一台接收机相对于另一台接收机的位置）。基准站的作用是获得所有其它未知点的位置。


基线

一点相对于另一点的位置。在GPS 测量中，是一台接收机相对于另一台接收机的位置。当这两台接收机的数据被联合使用的时候，所得结果是包含这两个站之间三维向量的一条基线。


基线处理器

利用卫星观测值来计算基线解的计算程序。它可在个人计算机上进行后处理或在接收机上进行实时处理。WAVE（加权模糊度矢量估算）是Trimble的基线处理软件。


波特

数据传输速度（从一个二进制数字设备到另一个二进制数字设备）的单位，在描述通讯速率时使用。


二元变量

在误差椭圆中描述下列内容的二维随机误差性能的数学函数：

  纵坐标/横坐标

  纬度/经度

  X/Y


CAD样式

CAD样式定义了一个项目中出现的点、线、弧、曲线、文字和注释。例如，样式可以由符号、线型、颜色或字体字型构成。样式的定义存储在项目中。

为了使样式适用于一些（而不是一个）项目，要把它定义在模板项目中。


校正点

校正点定义为现有坐标系统加改正值转换。这使得一个特定区域（或点）上，可以最好地与数据相符。

由于坐标系统被应用于很大的区域区，则必须有改正值转换。但不允许在地方坐标系内转化。

必须有新的适合于现有控制点的作务，因此，特殊的改正值转换对这些地方变化进行改正。这些改正仅在有限区域内有效。这解释了�校正点�这个术语。

Trimble Geomatics Office软件能计算适用于地方控制点的特殊转换，并将这些定义保存在坐标系统的数据库里。


校正坐标

WGS-84坐标（纬度/经度/椭球高度）由GPS观测值的最小约束网平差产生，然后保存在GPS校准点中，便于以后使用。

完成校正后，校正坐标被用作与特定点格网坐标相关的GPS观测坐标。


笛卡尔坐标

见地心地固笛卡尔坐标。


χ平方测试

网平差的总体统计测试，它是残差、自由度数和95%或更大临界概率的加权平方和的测试。

测试目的是拒绝或接受一项假设-预计误差已被准确估计的假设。


时钟偏差

两个时钟之间的读数差。在GPS中通常指卫星时钟和用户接收机时钟之间的偏差。


闭和差

网中观测数据和已知数据之间的一致性。


CMR

压缩测量记录（Compact Measurement Record）

由基准站接收机发播，实时动态测量使用并计算基准站到流动站的精确基线向量的卫星观测值信息。


粗糙探测(C/A)码

调制到L1信号上的伪随机噪声(PRN)代码，这种代码帮助接收机计算从卫星到测量点的距离。


代码

GPS码是一个调制在GPS载波信号上的伪随机噪声码。

C/A码没有加密，可被非军方用户使用。

P码也是已知的，没有加密，但也可以加密供国家安全部使用。

码观测值是GPS导航与定位的基础。为了获得更多的高精度测量基线解，码也可和载波相位观测值一起使用。


分量

用于定义两个控制点间的三维基线的三个测量观测值中的一个。同一基线可由方位、高度差、距离（在椭球坐标中）；ΔXΔYΔZ（以地心为原点的笛卡尔坐标）；北方向增量、东方向增量、向上方向增量（在地方平面坐标中）来定义。


星群

用于计算位置的一组卫星：三颗卫星决定二维方向，四 颗卫星决定三维方向。

同一时间被GPS接收机跟踪的所有卫星。最佳星群是定位精度因子的值最小的星群。参见PDOP。


被约束

在网平差中保持一个量（观测值和坐标）为真值。


约束

在网平差中施加在可调数量（观测值和坐标）上的外部限制。


控制点

一个坐标已经（或正在）用测量观测值被分配的标志点。


常规观测值

在现场用总站或经纬仪得到的观测值。


坐标系统

可把GPS位置（WGS-84椭球中）转换成具有大地水准面上高程的投影坐标的一组转换。

它由基准转换，确定大地水准面模型和坐标投影的定义所组成。

基准转换在坐标系统数据库中定义。它包括建立坐标投影的基准的定义。

已有的大地水准面模型可分配给坐标系统，也可能指明大地水准面差距常量，而不使用大地水准面模型。使用Trimble Coordinate System Manager 程序定义坐标系统数据库中的大地水准面模型。

 可以将一些坐标投影类型分配给一个坐标系统（例如，Transverse Mercator or Lambert One Parallel）。为了得到投影坐标的最佳结果，不同的国家和地区使用不同的投影方式。坐标投影方法是用适当的基准把纬度和经度值投影为笛卡尔坐标值。通过使用分配给坐标系统的大地水准面模型，得到投影坐标的高程。

通过使用Trimble Geomatics Office软件，Trimble Coordinate System Manager 程序可使您浏览、编辑和增添坐标系统定义。


关联

至少有一个公共误差源的两个或更多的观测值（或导出的数量）。


协方差

两个观测值或所获大量观测值间的误差的相关性测量。也可参见方差-协方差距阵中的非对角线（即不是方差）术语。


协方差矩阵

定义观测值的方差和协方差的矩阵。对角线上的元素是方差，非对角线上的元素是协方差。


协方差值

Trimble Geomatics Office软件使用的是从网平差中得出的多对控制点间传播的（计算的）方位、距离和高度的后验误差。术语协方差表明计算中使用了平差控制点的方差-协方差距阵中的协方差术语。


当前视图

可以使用窗口/新建窗口命令可以打开数据库中的多个视图。这些视图有不同的设置。当前视图是处于强调状态的视图，可以通过使用活动标题栏来识别。


周跳

接收机锁定一颗卫星时的无线电信号的中断。基线解算过程中，周跳需要重新估计整周模糊度。


数据记录

在文件中记录卫星数据的过程，这些数据存储在接收机、数据采集器（运行Trimble Survey Controller软件）或PC卡中。


数据信息

包含在GPS信号中，报告卫星位置、健康状况及星钟改正的信息。它包括其它卫星的健康状况及概略位置信息。


基准

为符合部分或全部大地水准面而设计的地球数学模型。它由椭球和作为地形表面上基准原点的点之间的关系来定义。它通常被作为一个测量基准。

椭球的大小和形状，椭球上对应于地心的中心点位置，通常定义了世界测量基准。


基准差异

两套坐标间的未知差值，只能通过网平差的基准转换进行校正。


基准转换

定义一种转换方式，这种转换方式把定义在一个基准中的点转换到另一个基准中。

Trimble Geomatics Office软件支持许多不同的基准转换方式：

  七参数法

  三参数法 (也叫作Molodensky)

  基准格网

  多重回归

在个别地区和国家，基准转换通常把用WGS-84 基准采集的数据通过GPS方式转换到用于测绘的基准上。


解除关联

用来去除观测点之间的协方差。这可以通过完善的正交转换、或由计算分离的水平和垂直平差去完成。


垂直偏差

向上方向的铅垂线（垂直的）与椭球正交线(法线)之间的角度差。


自由度

对网的冗余度衡量。


高程增量

两点之间的高程差。


高度增量

Trimble Geomatics Office软件对GPS基线垂直分量的表达。它是高度差或高度的变化量。


ΔN, ΔE, ΔU

地方大地平面坐标系统中的坐标差。


ΔX, ΔY, ΔZ

笛卡尔坐标系统中的坐标差。


差分定位

对于同时跟踪相同卫星的两个接收机的相对位置的精确测量。


DOP

精度因子（Dilution of Precision）

GPS定位质量的标志。它考虑到每颗卫星相对于星群中其它卫星的位置和相对于GPS接收机的几何位置。DOP值越小表示一个精度可能越高。GPS应用的标准DOP值为：

  PDOP 定位精度因子（三维坐标）

  HDOP 平面精度因子（二维平面坐标）

  RDOP 相对精度因子

  VDOP 垂直精度因子（仅限高度）

  TDOP 时间精度因子（仅限钟差）


多谱勒偏移

由卫星和接收机的相对运动引起的信号频率的明显改变。


双差分

跟踪相同卫星的两台接收机同时测量到的载波相位差的计算方式。这种方法消去了卫星和接收机的钟差。


DTM

数字地面模型（Digital Terrain Model）

地形在三维空间的电子描述。


双频

使用来自GPS卫星的L1和L2信号的接收机类型。双频接收机能够在长距离和比较恶劣的条件下计算更精确的位置固定点，因为它补偿了电离层的延迟。


地心地固(ECEF)

WGS-84参考框架使用的笛卡尔坐标系统。在这种坐标系统中，坐标系的中心在地球的质心。z轴与地球平均自转轴重合。x轴通过北纬0�和东经0�。 y轴垂直于x轴和z轴的平面。


东向

格网值东向的读数。在格网上从左到右（x轴）。


高程

距平均海水面的高度或大地水准面上的垂直距离。有时，高程指正高。


高程限定

通常被设置成13度的角。如果大于这个角度跟踪卫星，可避免由建筑物，树木和多路径效应引起的干扰。

Trimble建议在小于13度时不要跟踪卫星。


椭球

椭圆绕短半轴旋转构成的地球数学模型。对于模拟地球的椭球而言，短半轴是极轴，长半轴是赤道轴。

可以通过指定两个轴长，或指定长半轴和扁率来定义一个椭球。

两个参数定义一个椭球，通常这样给定：

长半轴的长度 a 和扁率 [image] ， 式中 b 是短半轴的长度。


椭球距离

椭球距离用在Trimble Geomatics Office软件中是指两点间的法截弧长度。

注意：椭球距离不同于测量距离。


椭球高度

从椭球表面到测点沿法线方向所测的距离。


要素

从图形窗口可浏览和选择的基本绘图元素。

Trimble Geomatics Office软件中的实体是点、线、弧、曲线、文字和注释。


星历

描述天体位置随时间变化函数的一组数据。每颗GPS卫星定期发送一个由控制段上载的广播星历，描述它在短期内的预测位置。事后处理程序也能使用一个描述卫星过去的确切位置的精密星历。


历元

GPS接收机的测量间隔。历元随测量类型变化：

  对于实时测量，设置到一秒钟

  对于后处理测量，可以设置到一秒钟与一分钟之间


历元间隔

GPS接收机使用的测量间隔，也叫周期。


误差

一个量的观测值和它的真值之差。测量误差通常分为三种：粗差，系统误差和随机误差。最小二乘原理用于探测和消除粗差和系统误差，最小二乘平差用于计算和适当分布随机误差。


误差椭圆

坐标误差椭圆用图形描述网平差点的误差的量级和方向。


事件

对所发生事件（如关闭了测量摄影机的镜头等）的记录。GPS接收机能够存入包括事件时间在内的事件标记以及通过输入键盘描述事件的字符评注。一个事件能够通过键盘触发，或在接收机的一个端口输入一个电信号去触发事件。


快速静态

利用长达20分钟的观测采集GPS原始数据的一种GPS测量方式。然后通过事后处理达到亚厘米级精度。通常观测的时间基于能观测到的卫星数：

  4 颗卫星需20分钟*

  5 颗卫星需15分钟*

  6 颗或六颗以上的卫星需8分钟*

(*以15秒的历元率采集)


要素和属性库(*.fcl)文件

包含要素代码、属性、CAD样式和控制代码定义的文本文件。


要素代码

描述性文字或描述要素的缩写。


域代码

使Trimble Geomatics Office软件把信息插入到报告，文件和注释中的特殊指令

域代码用于传输以ASCII形式来导入/导出/报告的数据库数据。


最终解

当事后处理用于产生GPS基线向量，尤其是静态解时，基线处理方式采用不同的处理技术，联合GPS观测值而产生不同解。通常，后一个解优于前一个的解。最终的解提供两测点间的GPS基线向量的最佳估算值。


固定

见被约束。


固定坐标

进行网平差时不移动的点坐标。


固定解

当基线处理器能够确定从搜索中选择一个整周的整周模糊度时所得到的解。它被称作固定解，因为从估算的浮动值到确定的整周值，模糊度总是固定的。


扁率

椭球长轴与短轴长度比的数学表达式。


扁率反算

更容易读出和编辑的扁率表达式。


浮动解

当基线处理器不能确定从搜索中选择到一个整周的整周模糊度时所得到的解。它被称作浮动解，因为包含少部分不是整周的模糊度。


自由平差

进行点（坐标）不被约束的网平差。网平差使用内部约束。


频率分布

数据组中残差的大小和分布。以柱状图表示。


完全约束

网平差中所有测点都在该网内，该网是较大控制网的一部分，它们被保持已被公布的坐标值固定不变。通常将小网并入较大的控制网，将旧网并入新网。


GDOP

几何精度因子（Geometric Dilution of Precision）

用户位置和时间误差与卫星距离误差之间的关系。又见DOP。


大地方位

大地子午线之间的角度及与观测者的测量线相切的切线。在平面内垂直于观测者的椭球法线。从北顺时针计。


大地基准

最近似大地水准面的椭球。

椭球的大小和形状及对应于地心的椭球中心位置定义测量基准。

各地区建立了最相符的不同基准。例如，欧洲地图通常建立在1950欧洲基准上。美国地图通常建立在1927或1983北美基准上。所有的GPS坐标都建立在WGS-84 基准表面上。


地理坐标

纬度、经度和椭球高度。


大地水准面

近似于平均海水面的万有引力等位面。它不是一个均匀的数学形状，而是一个整个形状类似于椭球的不规则图形。

通常，测点的高程依据大地水准面而得到。然而，用GPS方式固定的测点，其高度建立在WGS-84 基准上。

WGS-84 基准和大地水准面之间的关系必须通过观测确定，因为没有能描述这种关系的统一数学定义。必须使用常规测量方式来观测大地水准面上的高程，然后和同一点在WGS-84椭球上的高度相比较。

通过收集大量的大地水准面和WGS-84 基准之间的观测值之差，就能建立差距值的格网文件，它允许在中间位置插入大地水准面差距。把包含这些大地水准面差距的文件作为大地水准面模型。假设WGS-84定位值在大地水准面模型的范围内，模型能返回这一点的内插大地水准面差距值。


大地水准面模型

对于特定地区或整个地球的大地水准面的数学描述。软件利用大地水准面模型得到网内测点的大地水准面差距。


大地水准面观测值

带有相关误差的大地水准面差距从大地水准面模型中计算出来。Trimble Geomatics Office软件的网平差处理它们的方式与处理任何带有相关误差的观测值相同。随着平差的进行，观测值将成为平差后的大地水准面观测值。


大地水准面差距

已知测点在椭球和大地水准面上的距离。


地球数学

空间信息的设计、采集、存储、分析、显示和检索。采集空间信息有多种途径，包括GPS法和地面法。地磁法综合了传统的勘测技术与新的驱动技术，具有广泛的应用价值。


GPS

全球定位系统（Global Positioning System）

GPS基于一个以非常高的高度绕地球轨道运行的24颗卫星所组成的星群。


GPS基线

用差分技术同步采集和处理的GPS数据的一组测站间的三维观测值。

用Δx, Δy,Δz或方位，距离和高差来表示。


GPS观测值

带有相关误差的GPS基线，平差处理后，观测值成为平差的GPS观测值。


GPS原始数据

GPS接收机采集的用于事后处理的数据。格式为.dat文件（Trimble原始数据文件格式）或RINEX文件。


GPS时间

NAVASTAR GPS系统使用的时间度量。GPS时间是基于UTC的，它不加周期性的跳秒去改正地球自转周期引起的变化。


格网

二维平面直角坐标系，例如地图投影。


格网变换

地理坐标与地图投影坐标之间的转换。


格网距离

地图投影坐标系中两个格网点间的距离


地面距离

两地面点间的水平距离（考虑了曲率改正）


HDOP

水平精度因子（Horizontal Dilution of Precision）


高度测量杆

带有外部GPS天线并用于测量一点的天线高的测量工具。


HI

仪器高度（Height of instrument）

GPS天线高度的同义词。


柱状图

在网平差中，显示残差大小和分布的图。


平面控制点

只有平面坐标精度的点。高程或椭球高度是低精度的或未知的。


平面距离

从任一点的高程平面计算的两点间的距离。


平面位置

只有平面坐标的点。


独立

子网、观测值和控制点没有几何的或误差上的关联。该术语是相关的反意词。


内部约束

没有固定任何测点坐标而计算的网平差。Trimble Geomatics Office 软件使用网的质心作为内部约束。


整周模糊度

GPS卫星和GPS接收机间的载波相位中伪距的整周数。


整周搜索

无论实时的还是事后处理的，为了得到最可靠的解，GPS基线处理需要固定整周解，为了得到一个固定整周解，处理GPS测量值的软件通常采用一条基线来整周搜索，搜索包括不同的整周值的试结合和选择最佳结果。


消除电离层影响

消除电离层影响的解（ionospheric free solution(IonoFree)）

联合GPS测量值模拟和剔除GPS信号中电离层影响所得的解。这种解通常用于高级控制测量，特别是观测长基线时。


电离层

地球表面以上80-120英里处的带电粒子束。如果使用单频接收机测量长基线，它将影响GPS测量的精度。


 电离层模拟

根据GPS信号的频率的不同，电离层产生的时延，它对L1,L2载波信号有不同的影响，当使用双频接收机时，双频的载波相位观测值都能用于模拟和消除大部分电离层影响，当双频观测值不可用时由GPS卫星发播的电离层模型时可用于减弱电离层影响。然而，使用发播的模型不如使用双频观测值有效。


叠代

包含观测值方程，法线方程，坐标平差值和残差计算的一套完整的平差计算。


动态测量

在保持锁定至少4个卫星期间的一种短距离走走停停的GPS测量方法。能实时处理或者后处理到厘米级精度。


已知点初始化

已知点与动态初始化相关。如果两个已知点可用，基线处理器能够逆算两点获得初始化向量。这个初始化的基线向量，连同已知的基线分量可用于帮助确定整周模糊度。如果这个处理能成功地解决模糊度，就可能得到一个固定的整周解，也可为动态测量获得最优解。


L1

GPS卫星发送卫星数据所使用的L波段载波信号。它的频率是1575.42燤Hz。可用C/A码 ，P码和导航信息进行调制。


L2

GPS卫星发送卫星数据所使用的L波段载波信号。它的频率是1227.6燤Hz。可用P码和导航信息进行调制。


标签

项目中赋予点的信息。它们被标在测点旁以便很容易地查找它们。标签在测量视图计划视图中是可视的。

可使用Trimble Geomatics Office软件的预先确定标签定义来标注测点（例如，用它们的名称，要素代码和高程）。

标签使用与Microsoft Windows的外观设置中的工具提示相同的字体和大小。在数据库中用视图/点标签将标签分配给测点。


图层

能存储数据组的地方。

用这种方式把数据组织到各层，使它易于管理。在一个项目里，你能有任何数量的层数。使用属性窗口，把一个实体分配或再分配到一层。一个层的名称可多达100个数字字母符号。


最小二乘

基于概率原理的观测值平差的数学方法。在这种平差方法中，所有加权残差的平方和被最小化。


置信程度

对结果的置信度衡量，用百分比或sigma表示。


显著性程度

一种概率表达方式。1 sigma（标准）误差的意思是显著性水平为68%。对于一维误差，以1.96 sigma来表示95%的显著性水平，以2.576 sigma来表示1%的显著性水平。


地方椭球

由坐标系统指定的椭球。WGS-84坐标首先转换到这个椭球上，再转换到格网坐标上。


地方大地坐标

纬度，经度和测点高度。这个坐标根据地方椭球来表示。


地方大地水平面（LGH）

经过任何测点，高度为测点的椭球高，并与椭球的相切平面平行的平面。地方测量平面坐标值以北向，东向和向上的方向表示。在椭球上模拟基线之前，LGH被用于旋转EC笛卡尔坐标差。由于在椭球上部分模型化引起的倾斜法线，必须用LGH分量计算出的方位值进行改正。


环闭合差

环闭合差说明了在网内一组观测值中的误差数量。

通过选择点的一个或多个已知观测值，将其中一个观测值增添到测点坐标，基于该观测值计算第二点的坐标来计算环闭合差。这个过程是围绕一个环重复一次或多次，最后结束在开始的测点上。如果观测值中没有误差，最终计算的坐标将与原来的起点坐标完全相同。通过从起点坐标中减去计算出的坐标，闭合差就被确定了。误差除以线的长度，就得到误差的百万分比。

这种方法也能用于两上高精度的已知点，这种方法也被称作横断闭合差。


长轴

见椭球。


投影角

地图投影中格网北向和已知点所在的经度子午线之间的夹角。也称作收敛角。


地图投影

椭球曲面在直角坐标格网中的严密数学表达式。


平均海水面

潮汐各时期的海面高的平均高度。作为高程的参考。


最小约束

只够定义坐标系所采用的约束的网平差。用来测量观测值的内部一致性。


短轴

见椭球。


模拟

在某些定义的坐标系统，例如椭球中用数学的或几何的方法表示观测值和它的相对误差。


多路径

当GPS信号通过不同的路径到达天线时，会产生干扰（相似于电视屏幕中的“幻影”）。信号穿过较长路径产生一个较大的伪距估计，增加了误差。多路径可通过天线附近的建筑物反射产生。


窄带

L1和L2载波相位观测值的线性组合(L1 + L2)，有利于消除所采集的基线数据的电离层影响。窄巷观测值的有效波长为10.7�厘米。


NAVDATA

NAVDATA是卫星发播的1500比特的导航信息。信息包括系统时间，钟差改正参数，电离层延迟模型参数及卫星星历和健康状况。这个信息用于处理GPS信号，得到用户的位置和速度。


网

一组基线。又见子网。


网平差

在测量网中，通过最小化观测值残差的加权平方和的方法，同时解算方程来得到闭合差。

Trimble Geomatics Office软件所使用的平差方法有时称作坐标变换，有时称作间接观测值方式。


网状态

说明网平差中包括一个特定观测值。

 网意味着它包括在平差中

 非网意味着它不包括在平差中


NMEA

国家海洋电子协会（National Marine Electronics Association）

NMEA 0183 标准定义了用于海洋电子导航设备的界面。这个标准定义了称为NMEA的许多字符串，包含定位值之类的导航详细信息。大多数Trimble GPS接收机都能输出NMEA字符串格式的定位值。


法线

在测量中，垂直于椭球表面的直线。


正态分布曲线

根据概率理论，围绕一个预期值的随机变量的理论分布图示。


normal section azimuth


北向

格网值中的北向读数。


观测值残差

由平差确定的用于观测值的改正数。


观测值

见测量观测值。


观测时间

为了成功完成GPS 基线处理，在测站或测点所花的时间。所需时间取决于测量技术，所使用的GPS 接收机类型和最终结果所需的精度。观测时间可从几秒（动态测量）到几小时（需高精度和重复测量的控制测量和形变测量）。


原点

坐标系中轴的交叉点。起始测点。


正高

测点和大地水准面之间的距离。通常称作高程。


OTF搜索方法

为了获得最好的可能值，无论实时的还是事后的GPS 基线处理都需要固定整周解。（见整周搜索）

过去，当两台或更多的接收机被安置在它们各自的测点上时，用采集的观测值进行搜索。现代接收机和软件可在流动站接收机移动时采用这种采集的观测值。由于接收机在移动，数据描述为‘On-the fly’ (OTF)，使用这种数据的整周搜索即OTF搜索。


超限

由统计分析判断为含有超出估计误差太多的观测值。这个术语来自柱状图中的观测值的图示位置。


超量

一个网有太多观测值，超过了计算该网坐标所需的观测值。相当于冗余。


P-码

由GPS卫星发送的精确码。每颗卫星都有调制在L1和L2载波上的唯一代码。当A/S有效时，P码被Y码代替。


参数

一个独立的变量，它在线或面上的测点坐标已知。见未知。


奇偶性

用于二进制数字数据的存储和传输的误差检验的方式。奇偶性校验的选项包括奇、偶或无。


PDOP

位置精度因子（Position Dilution of Precision）

有利于用户所在位置的误差和卫星所在位置误差之间关系的无单位图形。在几何上，PDOP按由接收机和所能观测到的四颗卫星的连线所组成的锥状物的体积比例来平分1。对于好的定位而言，PDOP值小，例如3。比7大的值被认为是较差。因此，小的PDOP值与相隔较远的卫星相关。

PDOP值和HDOP及VDOP有关：


PDOP截止值

一个接收机参数，指定了用于定位的最大PDOP值。当卫星的几何方位产生了一个比中止值更大的PDOP值时，接收机就停止计算位置。


PDOP限定值

接收机计算位置的PDOP上限值。


相位中心

见天线相位改正。


相位中心模型

根据对于指定的天线类型将改正GPS信号的一种模型。这个改正是基于卫星在地平面以上的高度，并模拟天线相位中心位置的电量变化。当基准站和流动站使用不同的天线时，这些模型有利于引入的消除误差。又见天线相位改正。


铅垂

沿垂直于地球重力场等位面的铅垂线安置天线或仪器。


点定位

见自动定位。


后处理

采集完卫星数据后，在计算机上处理的过程。


PPM

百万分比（Parts per million）

距离观测值误差的标准比例表示。1 PPM误差表示每1000米的距离有1毫米的观测值误差。


精密星历

见星历。


精度

趋于计算值附近的随机变量的度量。高精度意味着小的残差。通常用百万分之一或百万分之几来表示。


PRN

伪随机噪声码（Pseudorandom number）

数字1和0像噪声一样随机分布，但能准确复制的序列。除非它们完全相同，伪随机噪声码对所有延迟都有一个很小的自动的相关值。

每颗NAVSTAR卫星都能被它唯一的C/A和伪随机噪声码辨别出来，因此，PRN这个术语有时用作GPS卫星或 SV的另一代名词。


概率

假设观测值中的一部分将在规定的限值范围内得出的一个统计百分比。有时称作显著性水平。


可能值

假定平差正确进行时，观测值和其它量的平差值。最接近可能真值的值。


项目

Trimble Geomatics Office软件在项目中操作数据，可将项目当作工作间。新项目总是从现有的模板中产生并包含模板中的所有元素。从这个测点开始，所有新工作都仅被保留在新的项目中。

项目包括所有原始观测值，被计算的测点，坐标系统定义，线操作，文本和CAD样式。


项目基准

Trimble Geomatics Office软件中与项目有关的基准。所有当地坐标都用项目基准显示。


投影

用于产生表示地球表面或该表面几个部分的平面地图。


传播误差

从估计观测误差导出的计算误差，用坐标位置的方法表示。传播坐标误差可以依次被传播进入相对误差，用二点间的方位角、距离和高度增量表示。


质量验收测试

为了确定数据能否通过确定的一系列限差值，对原始GPS观测数据进行的一个或多个软件评估测试。这些测验去掉来不需进一步处理的数据或标记需要提高质量的数据。


QC记录

质量控制记录（Quality Control records）

QC记录包含关于所测GPS定位值的质量信息。它们保存为点记录。


比率

初始化过程中接受机确定每颗卫星的波长整数。对于特定的一组整数，可算出其正确性的概率。

比率是当前最好的一组整数的正确性概率和下一组最好整数的正确概率之比。因此，高比率说明最好的一组整数优于其它任何组。我们可确信它是正确的。对于新的测点和OTF初始化，比率必须大于5。


RDOP

相对精度因子（Relative Dilution of Precision）


实时动态

保持锁定至少4颗卫星时，使用短时走走停停观测的实时GPS测量方式。这种方式需要基准站和流动站接收机之间的无线数据连接。


直角坐标

在任何参照轴相交成直角的系统中的坐标。


简化方程各项

法线方程的简化，该方程被重新整理，以使计算机存储所有非零元素所需的内存最小化。


冗余

控制网的数量过多，或严格计算所需的观测值过多。


冗余数

一个控制网的一部分而不是整个网的自由度。


冗余基线

观测一个已被其它观测值联接到网的测点的基线。一条冗余基线可以是一个独立的原观测值的重新观测值，也可以是从另一个基准来观测该点的观测值。它是多余的，因为它提供的信息比唯一确定测点所需的信息更多。但是冗余观测值在检验原观测值质量方面是非常有用的。


冗余观测值

重复的观测值，或者说是使网超量的观测值。


参考因子

见单位加权的标准误差。


参考框架

基准的坐标系统。


参考站

这是指基准站。


参考方差

参考因子的平方。


相对误差

网中成对的平差控制点间的误差和精度的表示。


残差

为了得到控制网的整体闭合差，观测值的改正数或平差值。或观测的量和该量的计算值之差。


RINEX

接收机独立交换格式（Receiver INdependent EXchange format）

标准GPS原始数据文件格式，用于多个接受机制造商的转换文件。


RMS

均方根（Root Mean Square）

RMS表示点的观测值精度，它是包括大约70%的定位数据的误差圆的半径。它可用距离单位或波长周数表示。


旋转子午线

倾斜的墨卡托地图投影的区域常量。


旋转角

转换过程中，坐标轴围饶坐标系原点转动的角度。


流动站

任何流动GPS接收机和在野外采集数据的外业计算机。流动站接收机可相对于固定的基准站接收机进行差分改正。


RTCM

无线电技术委员会海洋服务机构（Radio Technical Commission for Maritime Services）

该委员会定义了流动站GPS接收机的实时差分改正的差分数据链。有两种类型的RTCM差分改正信息，但所有的Trimble GPS接收机都使用较新的第二类RTCM协议。


RTK

实时动态（Real-time kinematic）

一种GPS测量方式。


卫星分布几何图形

GPS测量中GPS卫星的位置和移动情况。


标量

在最小二乘法中，应用于基于所需置信水平的方差（误差）的值。


标量加权

为了得到观测值的适当权值，将标量用于估算误差的过程。Trimble Geomatics Office 软件的网平差中有三种类型的标量：

 缺省意味着标量设为1.00，初始估算误差保持相同

 可选择意思是标量被设为前一平差的参考因子

 用户自定义意思是可输入一个值作为标量

用以下方法可将标量应用到观测值误差：

 所有观测值

 每个观测值

 方差分量组


比例

用于坐标和其它线性变量，例如地图投影和转换，的一个乘数。


SDMS

测量数据管理系统（Survey Data Management System）

用于存储测量数据的一组格式的定义。AASHTO维护这个系统。


选择可用性(S/A)

美国国防部人工对GPS卫星信号的消弱，由S/A引起的位置误差最大会达到100米。


长半轴

长轴的一半。


短半轴

短轴的一半。


时段

一个或多个GPS接收机记录卫星测量数据的一个时期。


装置误差

三脚架对中或控制点上仪器高的误差。


照准

没有冗余观测值的基线。


sigma

描述标准误差的数学符号或术语。


单频

只用L1 GPS信号的接收机类型。对电离层的影响没有补偿措施。


点校准

参数计算过程，它建立了由GPS观测值确定的WGS-84位置（经度，纬度，和椭球高）与由地图投影及平均海水面上的高程确定的地方已知坐标之间的关系。当使用RTK测量方式时，参数用于野外实时产生来自WGS-84（或相反）的地方格网坐标。


天空图

为了从图表上选择时间间隔，表示可观测的卫星的路径的极面图。卫星的高程以半径大小来表示，方位以角度大小来表示。这个结果描述了卫星的轨迹，因为它好像是观测者直接在观测点上方的一个地方来俯视。


解算类型

用于获得GPS测量基线解的数据和技术的一种表述。典型解的类型有码，浮动和固定。这些表示了基线处理者获得基线解的方式。解的类型也可有L1,L2，宽带，窄带或无电离层影响。这些表示了结合GPS观测值以获得特殊结果的方式。更多信息参见GPS处理中的参考站对这些术语和技术的进一步讨论。


斜距

平面中与两侧点间的垂直距离差（坡度）平行的距离。


SNR

信噪比（Signal-to-Noise Ratio）

对卫星信号强度的衡量。SNR的范围从0 (没有信号) 到35左右。


标准误差

统计的估计误差，根据大量观测值的68%在理论上有少于或等于这个值的绝对误差而得到。


单位加权标准误差

在平差后的网中与估计的先验观测误差相比的观测值残差的度量。


国家平面坐标

美国法规采用的Transverse Mercator and Lambert 正形地图投影的专用定义。其中一组地区用NAD-27，另一组用NAD-83。


静态（测量）

一种长时间（通常数小时）观测采集GPS原始卫星数据，然后进行事后处理以获得亚厘米级精度的测量方式。


静态网

静态网描述了组织和处理静态和快速静态技术采集的GPS基线的几何图形和次序。基线处理器首先检查高精度坐标检查点的投影，然后通过这些点建立处理网。结果是一组得到用精确初始坐标解算的静态基线。


状态

每个点的观测值和键入坐标的都有一个状态域（在性窗口的概要页面中）。

状态可以是激活、激活作为检核的、或非激活：

 激活的观测值和坐标总是被用作重新计算去获得测点的计算位置

 激活作为检核的观测值和坐标仅用在无激活的观测值和坐标时

 未激活的观测值和坐标从不使用


随机模型

对技术的总参考，用于估计网平差中的误差。


子网

由共同的控制点连接的一组基线，独立于其它基线。在Trimble Geomatics Office软件中，一个网可以由一个或多个子网组成，任何一个子网可以由一条基线和两个控制点构成。


超追踪

P-码加密后处理L2信号的Trimble特有方法。


测量观测值

用测量仪器，包括GPS接收机和常规仪器在控制点间测得的观测值。


SV

卫星运载工具（空间运载工具）（Satellite Vehicle (or Space Vehicle)）


符号和线类型

Trimble符号线类型编辑器程序保留了符号和线类型。使用这些编辑器，可以编辑已有的符号和线类型外，也可创建新的符号和线类型。符号被保存在符号库中，线类型被保存在线类型库中。

Trimble Geomatics Office软件使用当前系统的符号和线类型库。保存编辑后的库（如果不是当前系统库）时，可将它作为系统库。


系统误差

在大量相关观测值中，具有相同符号和相同量级的误差。


τ (值)

基于观测值数，自由度和给定概率（95%）的内部频率分布来计算的值。在平差中，这个值用于判断一个观测值与其它观测值是否相符。如果一个观测残差超过了这个值τ，它就被标志为一个超限值。标准残差柱状图中的τ线，中心垂线左右的重线。


τ 指标

Allen Pope的统计方法，用于探测超限的观测值。 欲知详情，请看  Pope (1976)。


TDOP

时间精度因子（Time Dilution of Precision）


地面观测值

地面观测值是在野外使用激光测距仪或常规仪器测得的观测值。


TOW

周时（Time of Week）

TOW以秒计算，从星期六午夜/星期天早上开始的GPS时间。


跟踪

接收和识别卫星信号的过程。


转换

将一个网从一个坐标系统移到另一个坐标系统而进行的旋转，平移和缩放。


转换参数组

用于计算转换参数的唯一的 一组观测值。典型地，组中的观测值是是同一类型，具有相似误差，以共同的测量方法测得。


转换参数

将一个基准转换到另一个基准时，从网平差中得到或用户自定义的一组参数。典型的，GPS中的参数是在从WGS-84转换到地方基准时产生的。


三角架

用于安装GPS天线和其它测量仪器在三角杆上的对中装置。


三角架对中误差

与测点上三角架的与对中线（铅垂线）有关的误差。这些误差是估计得到的。估计基于测量方式的质量，是保守的估计。


对流层改正

对卫星观测值的对流层延迟进行改正的改正值。


对流层模型

GPS信号在对流层发生时延。时延大小随温度，湿度，气压，测站在海平面以上的高度和GPS卫星在地平线上的高度而变化。使用一种考虑了这些时延的对流层模型可对码和相位观测值进行改正。


单变量

描述一维随机误差特性的数学函数。

  角度

  距离

  高差

  高程

  椭球高度


URA

用户测距精度（User Range Accuracy）

使用一种特殊的卫星运载工具（SV）时，由卫星问题和选择可用性（S/A）引入的误差。32米的URA表示S/A已启动。URA值由控制测段设置，被卫星发播。


未知数

对坐标和转换参数进行计算得到的平差值。也用于计算观测值残差。


US国家的

在美国及其管辖地区内支持国家大地测量基准和所有大地测量控制网的美国政府机构。


美制测量尺

1200/3937米。NAD-27的官方直线测量单位。


UTC

世界通用时间（Universal Time Coordinated）

基于格林威治（Greenwich）子午线的地区日照平均时间的时间标准。又见 GPS 时间。


方差

标准误差的平方。


方差分量估计

最小二乘技术，用于估计网的不同部分的相关误差。


方差分量组

网平差中应用方差分量估算的观测值组。


方差-协方差矩阵

描述一组观测值的方差和协方差的一组数字。


VDOP

垂直精度因子（Vertical Dilution of Precision）


向量

两测点之间的三维线。


垂线

与法线近似，只是它是从正切平面到大地测量平面而不是到椭球面计算的。


垂直平差

只是垂直观测值和坐标的网平差。


垂直控制点

仅具有垂直坐标精度的点。平面位置是较低精度或未知的。


波

加权模糊向量估算器（Weighted Ambiguity Vector Estimator）

波是Trimble基线处理器，它通过静态，快速静态，或实时动态的数据采集程序计算GPS野外观测值的基线向量。


权

观测值方差的倒数。


加权策略

在Trimble Geomatics Office软件中，用于增大方差-协方差矩阵的值的集合。


权阵

权或相关观测值的方差-协方差矩阵的倒数。


WGS-84

世界大地坐标系(1984)（World Geodetic System (1984)）

GPS自1987年以来采用的数学椭球。


宽带

L1 和 L2载波相位观测值的线性组合(L1 � L2)。它的有效波长很短（86.2厘米），对于确定长基线的整周模糊度非常有用。


X, Y 和 Z

在地心笛卡尔坐标系中，X轴指从系统原点到格林尼治子午线的方向，Y轴指从原点通过东经90� 的子午线，Z轴指向极地冰盖。在直角坐标系统中，X轴指东西轴，Y轴指南北轴，Z轴指向高度轴。


Y-码

Y码是包含在P码里的信息被加密而形成的。当A/S有效时，卫星发送Y码代替P码。


天顶时延

从天顶观测到的,来自卫星的GPS信号穿过对流层产生的时延。当卫星接近地平线时，信号穿过对流层的路径更长，时延增加。


GPS 精确星历文件

精确星历文件包含每个卫星在某确定时间周期内准确的位置数据和时钟校正，典型周期为一天。基线处理器使用该信息，去除广播星历误差后改进基线精确度。使用精确星历还可帮助基线处理器在长基线上获得固定解。

Trimble Geomatics Office 以两种文件格式支持精确星历的使用：

  .sp3 � 一种由美国国家大地测量测绘局定义的 ASCII 格式。

  .ef18 � 一种带有与包含于 .sp3 文件类似信息的二进制文件。.ef18 文件占用的磁盘空间较少，可被基线处理器更有效地使用。

精确星历的使用由激活的 GPS 基线处理器形式对话框的星历选项控制。精确星历文件必须导入到每个要使用精确星历的项目中。使用文件/导入将一个或多个精确星历文件载入到项目。

原始地，精确星历文件提供一周的卫星位置和时钟偏差。而现在的文件只提供一天的此类信息。即文件可在较短的时间周期生成可用。

基线处理器要求精确星历的时间段必须超过在数据开始之前和之后的最少八个 SV 历元所处理的 GPS 度量的时间段。需要这个附加的精确星历信息来保证测量开始和结束时 得到适当的插值。

精确星历导入程序可执行下述操作：

  检查文件格式。如果文件为 .sp3 格式，在导入过程中将被自动转换为 .ef18 格式。如果文件为 .ef18 格式，将被直接使用。

  确定项目中是否已经载入了精确星历文件。如果有，它将检查这些文件 的覆盖面以确定新文件的时间段是否和原有的覆盖相同。如果相同的话，新文件将取代旧文件，并在导入报告中提出警告，标明这种情况发生。

  将文件复制到精确星历文件夹中。

精确星历文件可从各种来源获得，包括：

  美国国家测量测绘局 (U.S. National Geodetic Survey)

  欧洲轨道确定中心（Center for Orbit Determination in Europe (CODE))

  欧洲空间机构 (European Space Agency)

  斯科瑞普斯轨道和永久排列中心（ Scripps Orbit and Permanent Array Center (SOPAC))

  加拿大能源局，矿井及资源（ Canadian Department of Energy, Mines and Resources (EMR))

  NASA 喷气推进实验室（NASA Jet Propulsion Laboratory (JPL)）


在计算机上导入精确星历文件 (.sp3, .e18)
导入精确星历文件到您的计算机  (.sp3, .e18)

1.	选择文件/导入。导入对话框出现。

2.	在测量标签中，选择精确星历文件 (*.sp3, *.e18) 选项。

3.	点击确认。打开对话框出现。

4.	确定您想导入的 .sp3 或 .e18 文件的位置。

5.	点击打开。

文件被载入到项目的精确星历文件夹中。

注：如果导入的精确星历文件和项目中原有的精确星历文件所覆盖的时间段相同，将显示提示信息。这条信息标明导入期间产生了一条或多条信息。要想查看这些文件，在该信息上点击是。

注：精确星历的使用由激活的 GPS 基线处理形式对话框星历选项控制。


注册概述
注册须知

如果您注册 Trimble Geomatics Office 软件并提供您的联系细节，Trimble 可以尽快发送给您有关软件的最新资料－包括产品的任何新进展。您的注册可帮助 Trimble 不断改进其产品支持和开发工作。

您可以在安装过程结束提示下注册 Trimble Geomatics Office 软件，或在使用 Trimble Geomatics Office 的任何时间进行注册。

注册步骤：

1.	在 Trimble Geomatics Office 中，选择帮助 / 注册。

2.	选择注册方法。可供选择的方法有：

  在互联网上填写提供的注册表并在网上递交。

  将提供的注册表打印出来，填写完毕后传真或用电子邮件投寄传真或电子邮件。

互联网和传真/电子邮件的注册表所列的问题相同。

您提供的信息将不会在 Trimble 以外使用或散播。注册表还包括有关您怎样和为什么要使用 Trimble Geomatics Office 的提问。这些问题不是必答的，但您的回答将再次帮助 Trimble 改进其产品支持及开发工作。


注册 � 通过互联网命令
注册 - 通过互联网命令

概述和更多信息

通过互联网注册 Trimble Geomatics Office：:

1.	选择帮助 / 注册 / 通过互联网。

在线注册表将显示在您的网络浏览器上。

2.	填写表格并确认在所有标有 * 号的栏中详细填写。

3.	点击现在发送注册。


注册 � 通过传真或邮件
注册 - 使用传真或电子邮件

 概述及更多信息

使用传真或电子邮件注册您的 Trimble Geomatics Office：

1.	选择帮助 / 注册 / 用传真或电子邮件。

Trimble Geomatics Office 注册表将显示在您的缺省文本编辑软件上。

2.	填写表格并确认在所有标有 * 号的栏中详细填写。

3.	将表格存盘。

4.	将表格发送到：

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

USA

Attention: Technical Publications Group

传真： +1 720 887-6101


 GPS环闭合差报告 - 概述

更多信息

如何做 ...	报告	也请参见

概述

GPS环闭合差报告可以用于在网内帮助评判一组GPS观测值的质量。您可以用它检查基线处理结果中的错误（前提是已经安装了基线处理模块）。但要生成环闭合差，必须先设计好网，使之具有闭合的几何数据。在这种情况下，Trimble Geomatics Office 就会自动生成所有可能的闭合环，并作出GPS环闭合差报告。

环闭合差设置对话框可用于控制如何建立和分析闭合环，它还可用来控制GPS环闭合差报告中的信息量。您可以从报告 / 设置 / GPS环闭合差报告进入环闭合差设置状态。

缺省的 GPS 环闭合差报告包括下列部分：

  题头

  总结

  失败的闭合环

  失败闭合环中的观测值

  失败闭合环中的时段

下列附加部分可以包括在报告中，方法是在环闭合差报告设置对话框中选择这些部分：

  失败闭合环的细节

  通过的闭合环

  通过闭合环的细节

仔细阅读以下指导：

  小的闭合差误差不可避免，但是大的闭合差误差就表明这个闭合环中至少一个观测值有问题。

  大的闭合差误差经常是由域中产生的错误引起的，例如输入了错误的天线信息或是没有设置好恰当的站点。检查域注释，那些构成多重不合格闭合环的观测值已被标记起来，核对与之相关的信息。

  在把网设计成包括闭合的几何数据时，要确认网的观测是用包含在每个数字中不同时间段所得到的基线的方法进行的。如果闭合环用同一时间段观测到的基线生成，则公共测站设置的错误就不能被检测到。

注意：可以从环闭合差报告链接到测量视图中的GPS闭合环。


    GPS环闭合差报告 - 题头

更多信息

如何做 ...	报告	也请参见

每个报告都应有报告题头。它包括项目概述摘要和目录。目录部分使用超链接显示，使您可以直接进入报告的各个部分。

它显示了以下域，其中大部分包含您在项目属性中指定的信息：

项目

显示项目名称。

用户名

显示用户名。

时间和日期

显示报告生成时间和日期。

坐标系统

显示坐标系统。

区域

显示坐标系统区域。如果选择了GPS校正点，则点名称会被显示在区域域中。

所有坐标系统都有一个区域。唯一的例外是缺省投影，它在区域域中显示“缺省”。在您假设一点的坐标时可以使用缺省值，例如 纵轴 = 10000, 横轴 = 10000, 高程 = 100。

项目基准

显示项目基准。但它并不代表为平差选择的基准。

垂直基准

您可以把这个域加到网平差报告题头的信息中。方法是：把需要的详细资料加入到项目属性对话框 - 项目细节标签中的垂直基准上。

大地水准面模型

如果在项目属性里分配了模型，这个域将显示大地水准面模型。如果大地水准面模型没有分配到项目中，“没有选择”将出现在域中。

坐标单位

显示在项目属性里被选择的坐标系统的单位。

距离单位

显示距离单位。

高度单位

显示高度单位。

目录

GPS环闭合差报告的目录由环闭合差设置对话框的设置所控制。缺省的GPS环闭合差报告包括下列部分：

  题头

  总结

  失败的闭合环

  失败闭合环中的观测值

  失败闭合环中的时段

要想把报告的附加部分包括在报告中，在环闭合差设置对话框内进行选择：

  失败的环闭合差细节

  通过的环闭合差

  通过的环闭合差细节


    GPS环闭合差报告 - 总结

更多信息

如何做 ...	报告	也请参见

总结部分是对环闭合差分析结果的一个快速归纳。它被包含在缺省报告中，包括以下信息：

闭合环节点

显示建立闭合环各边所需的观测值的数目。缺省数目是3。如果指定的数目多于3，则所有具有等于或少于这个数目（即节点）的闭合环就会生成。例如，如果指定数目是5，那么所有含有5边、4边或3边的闭合环都会在报告中被考虑到。

闭合环数目

显示生成的闭合环总数。

通过的数目

显示了通过接受标准的闭合环数目。

未通过的数目

显示未通过接受标准的闭合环数目。

通过 / 不通过指标

显示绝对的垂直的和水平限差值。

最佳

这些域显示生成的最佳闭合环结果。

最差

这些域显示生成的最差闭合环结果。

平均闭合环

这些域显示为该报告生成的所有闭合环的平均结果。

标准偏差

这些域显示为该报告生成的所有闭合环的标准偏差。


    GPS环闭合差报告 - 失败的闭合环

更多信息

如何作...	报告	也参见
失败的闭合环部分提供每个未通过闭合差误差限差测试的闭合环信息。当一个闭合环的闭合差误差大于GPS 环闭合差设置对话框中指定的限差时，这个闭合环就是失败的。这一部分已包括在缺省报告中。

表示一个失败闭合环的样本报告示于如下：

GPS 闭合环 1：
MOON 2:WAVE:N 245:MOON 2

观测值：

		从	到	解算类型	开始时间
B3	S1	MOON 2	WAVE	L1 固定的	13:45:03 24 二月 1999
B47	S5	MOON 2	WAVE	L1 固定的	13:11:03 24 二月 1999
B2	S8	WAVE	N 245	L1 固定的	13:45:03 24 二月 1999
B46	S4	MOON 2	N 245	L1 固定的	13:43:48 24 二月 1999
B49	S7	MOON 2	N 245	L1 固定的	12:28:33 24 二月 1999

闭合环 1 的失败组合：

	长度	dHoriz	dVert	Ppm
S5 � S8 � S7	3295.499m	0.026m	0.034m	12.915

观测值表

表的前两列分别代表闭合环中使用的GPS观测值基线ID和解算ID。基线ID代表GPS数据的两个重叠组的组合，这些GPS数据经过处理可以组成一条基线。解算ID代表由基线处理器生成的实际基线解法。一个基线ID可以有许多个解算ID。如果您保存GPS处理结果，当覆盖重复的基线解算检查框被清除时，这一情况就会发生。

其余列的内容如下：

从

显示观测的起始点。

到

显示观测的结束点。

解算类型

显示观测值的解算类型。

开始时间

显示观测的开始时间。

闭合环 # 的失败组合表

闭合环 # 的失败组合表用于确定那些生成闭合差误差大于接受指标的观测值组合。上面的例子显示的是单个组合。如果一些失败的情况发生，多重组合就会列在表里。表的第一个列显示的是失败组合中的基线解算。

提示：如果您点击失败的组合，测量视图中的观测值就会被突出显示。

其余列的内容如下：

长度

这个域显示横贯闭合环的总距离。

dHoriz

这个域显示闭合环生成的水平的闭合差误差。

dVert

这个域显示闭合环生成的垂直的闭合差误差。

Ppm

这个域以百万分位来显示总的水平及垂直的闭合差误差。


GPS环闭合差报告 - 失败闭合环中的测量值
    GPS环闭合差报告 - 失败闭合环中的观测值

更多信息

如何作...	报告	也参见
这部分可以帮助确定那些不适合本网的GPS基线。它通过检测所有失败的闭合环和报告那些在多重失败闭合环中发现的基线来实现这一功能。所得结果被重新排序，在大多数失败闭合环中都存在的那些基线被列在顶端。它还包括基线总结统计，可以帮助确定不良的解。

这一部分已包括在缺省的报告中。

样本报告部分示于如下：

		从	到	解算类型	比率	参考方差	RMS	出现的 #
B2	S8	WAVE	N 245	L1 固定	21.8	2.489	0.006	3
B47	S5	MOON 2	WAVE	L1 固定	2.9	1.693	0.005	2
B5	S19	COWBOY	KTOM	L1 固定	8.5	1.117	0.009	1

返回到顶部

表格的前两列分别代表作为多重失败闭合环构成部分的GPS观测值的基线ID和解算ID。基线ID代表重叠的两套经过处理可以组成一个基线的GPS数据的组合。解算ID代表由基线处理器生成的一个实际的基线解法。一个基线ID可以有许多个解算ID。如果您储存 GPS 处理结果，则当覆盖重复的基线解算检查框被清除时，这一情况就会发生。

其余列内容如下：

从

显示观测的开始点。

到

显示观测的结束点。

开始时间

显示观测的开始时间。

比率

显示由基线处理器决定的GPS观测值的比率。

参考方差

显示由基线处理器决定的GPS观测值的参考方差。

RMS值

显示由基线处理器决定的GPS观测值的RMS值。

出现的数目 #

显示那些以GPS观测值为构成的失败闭合环的数目。那些出现数目高的观测值应该被小心复审，以检查它们对网的适合程度。


    GPS 环闭合差报告 - 失败闭合环中的时段

更多信息

如何做 ...	报告	也请参见
这部分可以帮助确定那些不适合本网的站点时段。这些站点时段也许会包含一些站点设置的错误。它通过检测所有的失败闭合环和报告那些在多重的失败闭合环中发现的基线来实现这一功能。所得结果被重新排序，在大多数失败闭合环中都存在的那些基线被列在最顶端。

这一部分已被包括在缺省的报告中。

样本报告部分示于如下：

失败的闭合环时段

点	开始时间	出现的 #
KTOM	10:46:18 24 二月 1999	6
WAVE	13:11:03 24 二月 1999	5
MOON2	12:04:48 24 二月 1999	4
COWBOY	14:05:03 24 二月 1999	3
N 245	12:28:33 24 二月 1999	2
COWBOY	12:45:48 24 二月 1999	1
返回到顶部

列的内容如下：

点

显示观测发生点的名称。

开始时间

显示观测的时间。使用这一时间来核查那些与项目包含内容相违背的域注脚。

发生数目 #

显示观测一个作为失败闭合环构成的观测值所用的时间。那些出现数目高的时段，应该被检验是否含有站点设置的错误。


    GPS环闭合差报告 - 失败闭合环的细节

更多信息

如何做 ...	报告	也请参见
这部分提供了每个没有通过闭合差误差限差测试的闭合环的进一步详细信息。它不包括在缺省的报告中。您可以在环闭合差设置对话框中激活它。

样本报告部分示于如下：

失败的闭合环细节

闭和环 S1 - S86 - S3：

从：	MOON 2
到：	WAVE		L1 固定	13:45:02 24 二月 1999
		斜坡：	962.407m	606819.055m
		总计：	962.407m	1828548.125m
				29.499m
到：	N 245		L1 浮动	13:45:02 24 二月 1999
		斜坡：	852.542m	606662.061m
		总计：	1814.949m	1829386.030m
				33.251m
到：	MOON 2		L1 固定	13:43:47 24 二月 1999
		斜坡：	1480.504m	605983.905m
		总计：	3295.453m	1828070.086m
				26.770m
精度：		32.407ppm
误差	水平：	0.096m	垂直：	�0.046m

这张表的最上方是那些作为闭合环构成的基线解算的列表。然后是从站点，它是闭合环的起始点。

该原始信息后跟着三个或三个以上的小段，每小段有四行。这些小段包含了站点信息，它们按照程序贯穿闭合环的顺序出现。每个小段的第一行都由标识符到：开头。这些站点小段提供了以下信息：

第一行

四行小段中有标识符到：的是第一行。它提供有关GPS观测值的信息。在标识符到：之后，是按照闭合环的贯穿顺序排列的点名称。在这以后是GPS观测值的类型和GPS观测采集的数据。

该行提供的信息与表格顶端的一个解算ID相对应。想获得特定基线解算的详细信息，可以使用测量视图中的属性窗口来检查有关统计数字，或者选择生成一个关于此基线的GPS 基线处理报告 。

第二行

四行小段中有标识符斜坡的是第二行。在它之后是GPS观测值的斜距。然后是当前的到点坐标的纵轴。

第三行

四行小段中有标识符总计的是第三行。在它之后是到目前为止在建立闭合环中贯穿的总距离。然后是当前的到点坐标的横轴。

第四行

四行小段中的最后一行没有标识符。它显示的是当前到点坐标的高度。

注：这里报告的纵轴、横轴以及高度坐标与在项目里找到的坐标不同。这里显示的坐标值是把GPS观测值加入到最初的从站点坐标中、同时在闭合环的各处继续着这一向量的增加而得到的。在闭合环的结尾处以这种方式得到的坐标会被从最初的从站点坐标中减去以生成闭合差误差。

表中的最后一个站点小段是关于从站点的，它表明这个闭合环已经关闭。表的最后两行提供了有关闭合差误差的信息。

精度

这个域以百万分位显示总的垂直的和水平的闭合差误差。

误差

这个域显示这个闭合环所生成的垂直的和水平的闭合差误差。


    GPS环闭合差报告 - 通过的闭合环

更多信息

如何做 ...	报告	也请参见
这部分提供每个通过限差测试的闭合环信息。当一个闭合环的闭合差误差等于或小于指定的限差时，它就通过了测试。这一部件不包括在缺省的报告中。您可以从环闭合差设置对话框中激活它。

样本报告部分示于如下：

通过的闭合环

GPS 闭合环 1：
MOON 2: WAVE: COWBOY: MOON 2

观测值：

基线 ID	解算 ID	从	到	解算类型	开始时间
B3	S1	MOON 2	WAVE	L1 固定	13:45:02 24  二月 1999
B47	S4	MOON 2	WAVE	L1 固定	13:11:02 24  二月 1999
B1	S9	WAVE	COWBOY	L1 固定	14:05:02 24  二月 1999
B45	S2	MOON 2	COWBOY	L1 固定	14:05:02 24  二月 1999
B48	S5	MOON 2	COWBOY	L1 固定	12:45:47 24  二月 1999
闭合环 1 通过的观测值：

	长度	dHoriz	dVert	Ppm
S1 - S9 - S2	3795.569m	0.001m	-0.002m	0.508
S1 - S9 - S5	3795.577m	0.009m	0.001m	2.296
S4 - S9 - S2	3795.568m	0.018m	-0.012m	5.683
S4 - S9 - S5	3795.577m	0.020m	-0.009m	5.872

观测值表

表的前两列分别代表用在闭合环内的GPS观测值的基线ID和解算ID。基线ID代表两套重叠的经过处理可以组成一个基线的GPS数据组合。解算ID代表由基线处理器生成的一个实际的基线解法。一个基线ID可以有许多个解算ID。如果保存GPS处理结果，在覆盖重复的基线解算检查框被清除时，这一情况就会发生。

其余列的内容如下：

从

显示观测的起始点。

到

显示观测的结束点。

解算类型

显示观测值的解算类型。

开始时间

显示观测的开始时间。

闭合环 # 的通过组合表

闭合环 # 的通过组合表可用于确定那些生成的闭合差误差小于接受指标的GPS观测值组合。表的第一列显示的是通过组合中的基线解算。

提示：如果您点击已通过的组合，测量视图中的观测值就会被突出显示。

其余列的内容如下：

长度

显示横贯闭合环的总距离。

dHoriz

显示闭合环生成的水平闭合差误差。

dVert

显示闭合环生成的垂直闭合差误差。

Ppm

这个域以百万分位来显示总的水平及垂直的闭合差误差。


    GPS环闭合差报告 - 通过的闭合环细节

更多信息

如何做 ...	报告	也请参见
这部分提供了每个通过闭合差误差限差测试的闭合环的进一步详细信息。它不包括在缺省的报告中。您可以用GPS环闭合差设置对话框激活它。

样本报告部分示于如下：

通过的闭合环细节

闭合环 S1 - S9 - S2：

从：	MOON 2
到：	WAVE		L1 固定	13:45:02 24  二月 1999
		斜坡：	962.407m	606819.055m
		总计：	962.407m	1828548.125m
				29.499m
到：	COWBOY		L1 固定	14:05:02 24  二月 1999
		斜坡：	1076.569m	607738.388m
		总计：	2038.976m	1827988.084m
				22.331m
到：	MOON 2		L1 固定	14:05:02 24  二月 1999
		斜坡：	1756.593m	605983.815m
		总计：	3795.569m	1828070.120m
				26.815m
精度：	0.50858508651573ppm
误差	水平：	0.001m	垂直：	�0.002m

这张表的最上方是那些作为闭合环构成的基线解算的列表。然后是从站点，它就是闭合环的起始点。

该原始信息后面跟随着三个或三个以上的小段，每小段有四行。这些小段包含了站点信息，它们按照程序贯穿闭合环的顺序出现。每个小段的第一行都由标识符到：开头。这些站点小段提供了以下信息：

第一行

四行小段中有标识符到：的是第一行。它提供有关GPS 观测值的信息。在标识符到：之后，是按照闭合环的贯穿顺序排列的点名称。在这以后是GPS的观测的类型和采集GPS观测值的日期。

该行提供的信息与表格顶端的一个解算ID相对应。想获得有关特定基线解算的详细信息，可以使用测量视图中的属性窗口来检查有关统计数字，或者为此基线生成一个GPS 基线处理报告 。

第二行

四行小段中有标识符斜坡的是第二行。在此标识符之后是GPS观测值的斜距。然后是当前的从点坐标的纵轴。

第三行

四行小段中有标识符总计的是第三行。在此标识符之后是到目前为止在建立闭合环中贯穿的总距离。然后是当前的到点坐标的横轴。

第四行

四行小段中的最后一行没有标识符。它显示当前到点坐标的高度。

注：这里报告的纵轴、横轴以及高度坐标与在项目里找到的坐标不同。这里显示的坐标值是把GPS观测值加入到最初的从站点坐标中、同时在闭合环的各处继续着这一向量的增加而得到的。在闭合环的结尾处以这种方式得到的坐标会被从最初的从站点坐标中减去以生成闭合差误差。

表中的最后一个站点小段是关于从站点的，表明这个闭合环已经关闭。表的最后两行提供了有关闭合差误差的信息。

精度

这个域以百万分位显示总的垂直和水平闭合差误差。

误差

这个域显示闭合环所生成的垂直的和水平的闭合差误差。


    GPS环闭合差设置对话框

更多信息

 如何做 ...

这一对话框可用来配置环闭合差选项，还可用来选择在GPS环闭合差报告中包括的各个部分。

要查看环闭合差设置对话框，选择下列方法之一：

  选择报告 / 设置 / GPS环闭合差报告。

  按 Alt+RSL。

环闭合差设置对话框出现。

包括以下内容：

闭合环节点

编辑这个域来指定用来组成闭合环的边的观测值数目。缺省值是3。如果指定的数目多于3，所有等于或少于这一节点数目的闭合环就会自动生成。例如：如果指定数目是5，那么所有含有5边、4边或3边的闭合环都会在报告中被考虑到。

限差

编辑这个域来定义可接受闭合差误差的最大值，使项目达到要求的精确度。闭合差误差超过这一要求的闭合环，在GPS环闭合差报告中将被认定为失败的。限差可以基于或是绝对距离或是以百万分位表示的比率。

当选框绝对被选中时，垂直域和水平域才有效。在这些域中输入垂直和水平的距离限差以指定允许的闭合差误差的最大值。

当选框比率被选中时，Ppm域才有效。在域中输入允许的闭合差误差的最大值。当比率被选中时，在进行闭合差误差限差测试以前，垂直和水平的闭合差误差已被结合在一起。

报告的各部分

使用这个组中的检查框选择在 GPS 闭合差报告中出现的部分。这些后续部分包括在：

  概述

  失败的闭合环

  失败闭合环的细节

  失败闭合环中的观测值

  失败闭合环中的时段

  通过的闭合环

  通过闭合环的细节

缺省部分包括：

  概述

  失败的闭合环

  失败闭合环中的观测值

  失败闭合环中的时段

只要清除相应的检查框，任何一部分都能从报告里删除。如果选择相应的检查框，其它部分可以包括在报告中。

只用有效的解

如果要在环闭合差报告中只包含有效的解，选择这个检查框。


    GPS环闭合差报告命令

如何做 ...	报告

使用这一命令可执行环闭合差分析功能并且以报告格式查看结果。

查看GPS环闭合差报告:

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，那么闭合环差报告对话框 将会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机缺省的HTML浏览器就会启动，并且载入GPS 环闭合差报告 。


    设置GPS环闭合差报告

更多信息

如何做 ...	对话框

使用这一命令来选择包括在GPS环闭合差报告中各个部分。

要查看GPS环闭合差报告设置对话框，选择下列方法之一：

  选择报告/设置/GPS环闭合差报告。

  按 Alt+RSL。

计算机缺省的HTML浏览器启动，GPS 环闭合差报告设置对话框出现。

注：有些部分在缺省的情况下会显示，附加部件也可以加入到缺省中。您可以通过激活或禁用任意的检查框组合来制定报告的内容。


环闭合差报告对话框

用这个对话框来选择报告方式：是在整个数据库上进行报告还是在选择的闭合环的基础上进行报告。

要查看GPS 环闭合差报告：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，并且载入GPS 环闭合差报告 。


环闭合差检查

基线处理后，一个红色的警告标志会出现在测量视窗里，标出每个没有达到质量接受指标的基线。在进行闭合环差分析时，有警告标志的基线就可能造成大的闭合差误差。

可能引起不良闭合差误差的原因包括：

  在错误测量点以上进行设置。

  输入不正确的天线信息。

  不良处理结果。

检查环闭合差：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框出现。

2.	选择下列选项中的一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览就器会启动，同时报告就会出现，报告题头在它的最上方。

3.	点击总结。

出现环闭合差报告的总结部分。


设置GPS环闭合差报告

 概述及更多信息

GPS环闭合差报告部分可以被激活或禁用，以控制报告的内容。在缺省情况下，这些报告部分是被激活的：

  总结

  失败的闭合环

  失败闭合环中的观测值

  失败闭合环中的时段

如果不激活，下列报告部分也是可用的：

  失败闭合环的细节

  通过的闭合环

  通过闭合环的细节

要激活或禁用报告的部分：

1.	查看 GPS 环闭合差报告，进行下列操作之一：

  选择报告 /设置 / GPS 环闭合差报告。

  按 Alt+RSL。

环闭合差设置 对话框出现。

2.	在报告部分组中，选择或清除可用的检查框。


查看GPS环闭合差报告总结

 概述及更多信息

如果要查看报告总结：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，那么闭合环差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现，报告题头在它的最上方。

3.	点击总结。

总结部分将会出现。


查看GPS环闭合差报告

 概述及更多信息

如果要查看报告：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 � 在选择的基线基础上执行一个环闭合差。

  整个数据库 � 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现。

3.	通过目录超链接直接跳到报告的各个部件并且检测数据。


查看GPS环闭合差报告题头

 概述及更多信息

查看报告题头：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现，报告题头在它的最上方。

3.	通过滚动条来检测数据。


查看GPS环闭合差通过的闭合环统计

 概述及更多信息

通过的闭合环部分确定那些通过闭合差误差限差测试的闭合环。这个报告部分不包括在缺省报告中。通过在环闭合差设置对话框中选择这个部分，您就可以把该部分包括在报告中。

查看通过的闭合环统计：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，那么闭合环差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现，题头在它的最上方。

3.	点击通过的闭合环。

通过的闭合环部分出现。


查看GPS环闭合差通过的闭合环细节

 概述及更多信息

通过的闭合环细节部分提供了那些通过闭合差误差限差测试的闭合环的进一步详细信息。这一部分不包括在缺省的报告中。您可以在环闭合差设置对话框中选择这个部分，使它包括在报告中。

查看通过的闭合环统计：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现，题头在它的最上方。

3.	点击通过的闭合环细节。

通过的闭合环细节部分出现。


查看GPS环闭合差失败的闭合环细节

 概述及更多信息

失败的闭合环细节部分提供了那些没有通过闭合差误差限差测试的闭合环的进一步详细信息。这一部分不包括在缺省的报告中。您可以在环闭合差设置对话框中选择这个部分，使它包括在报告中。

查看失败的闭合环细节：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框 就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

3.	点击失败的闭合环细节。

失败闭合环的细节部分出现。


查看失败闭合环统计里的观测值

 概述及更多信息

失败的闭合环观测值部分可以帮助确定那些不适合本网的GPS基线。它通过检测所有失败的闭合环和报告那些在多重失败闭合环中发现的基线来实现这一功能。所得结果被重新排序，在大多数失败闭合环中都存在的那些基线被列在最顶端。它还包括基线总结统计，可以用于帮助确定不良的解算。

查看失败闭合环中的观测值：

1.	要查看环闭合差报告，按下列方法之一进行：

  选择报告 / 环闭合差报告。

  按 Alt+RL。

在环闭合差分析完成后，您计算机的缺省HTML浏览器会启动，同时报告就会出现，题头在它的最上方。

2.	点击失败的闭合环观测值。

失败闭合环中的观测值部分出现。


查看失败的闭合环统计里的时段

 概述及更多信息

这个部分可以帮助确定那些不适合本网的基线站点时段。这些站点时段也许会包含一些站点设置错误。它通过检测所有失败的闭合环（确定在多重失败闭合环中发现的基线）和报告对这些基线的公共时段来实现这一功能。所得结果被重新排序，在大多数失败闭合环中都存在的那些基线被列在顶端。

如果查看失败闭合环中的时段：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，那么闭合环差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现，题头在它的最上方。

3.	点击失败闭合环中的时段。

失败闭合环中的时段部分出现。


查看失败的闭合环统计

 概述及更多信息

失败的闭合环统计确定为何一个基线闭合环中的节点不能闭合。

查看失败的闭合环统计：

1.	选择报告 / GPS环闭合差报告。如果您已经在图形窗口里选择了观测值，则环闭合差报告对话框就会出现。

2.	选择下列选项的任意一个：

  选择 - 在选择的基线基础上执行一个环闭合差。

  整个数据库 - 在整个数据库基础上执行一个环闭合差。

在环闭合差分析完成后，您计算机的缺省HTML浏览器就会启动，同时报告就会出现，题头在它的最上方。

3.	点击失败的闭合环。

失败的闭合环部分出现。


查看基线警告标志属性

 概述及更多信息

基线处理后，图形窗口里的红色警告标志会标在每个没有到达质量接受指标的基线上。

如果查看警告标志的细节：

1.	选择一个基线。

2.	打开属性窗口 (点击鼠标右键在出现的快捷菜单中选择属性)。

属性窗口出现。

3.	点击属性窗口内选择条目中基线旁边的增加 (+) 图标。

选择条目目录扩展，并显示了基线的“从”点和“至”点。一个红色标记就代表一个基线处理的错误。

4.	选择任意一个有标记的点。

5.	按下列的任一操作进行：

  点击警告标志按钮。

  从详细页面菜单里选择警告。

一段信息显示出标注这个基线的原因。用这段信息可以解决那些阻碍基线达到接受指标的问题。如果需要更多的信息，请看GPS数据处理分析。


重新计算 - 概述

重新计算是建立一个点的被计算的位置的过程。

Trimble Geomatics Office在所有数据上进行重新计算，即：所有的GPS,常规的和激光测距仪观测值，并且键入或输入一个点的坐标。它使用这些观测值和键入的坐标来决定点的最高可能质量的位置。

重新计算：

  计算在这个区域中被测量的点的位置

  给予点一个适当的质量

  检测并且报告数据中的误差

  产生重新计算报告

如果一个点有多余的测量数据，点推导报告显示出被用来建立计算位置的观测值或被键入的坐标。重新计算报告显示任何限差之外的多余观测值。限差被定义在项目属性对话的重新计算标签中。

无论何时在项目中增加数据都需要重新计算，或者如果编辑现有的数据,例如，如果改变GPS 观值的天线高。

但是，Trimble Geomatics Office不自动进行重新计算。当需要重新计算时，重新计算图标 { bmct  IRecmpt.bmp } 显示在Trimble Geomatics Office的状态栏中。

重新计算，做下列之一：

  选择测量/重新计算。

  按F4。

  在状态栏中，双击重新计算图标(如果可得到)。

  单击鼠标右键访问快捷菜单并且选择重新计算选项。

注: 能在任何时候进行重新计算。但是，如果重新计算图标不首先显示在状态栏，没有变化。

重新计算：

  不分配误差。

  使用平差，控制或优先选择的观测值的被键入坐标的测量质量。

注: 术语键入坐标指键入用于Trimble Geomatics Office的点的坐标或从数据文件输入到Trimble Geomatics Office项目的点的坐标。


重新计算 - 如何确定被观测点的计算位置

 概述和更多信息

流程图显示重新计算如何在这个区域中查找被观测点的计算位置。

注：当确定一个被观测点的计算位置时，重新计算不使用停用的观测值或停用的被键入坐标。如果项目中点的位置不能由任何其它观测值或坐标确定，它仅仅使用能作为检核的观测值或被键入坐标。使用属性窗口启用和停用观测值。

这些主题描述流程图中的框：

  重新计算如何确定可能的起点

  重新计算如何确定所有可能起点的位置

 重新计算 - 分量质量如何确定当前的起点

  重新计算 - 观测值如何从当前起点被使用

  重新计算 - 如何确定被观测的点的质量


重新计算 - 重新计算如何确定可能的起点

  概述和更多信息

重新计算能从有下列特征的任何点开始：

  被键入的坐标，和

  来自点的一个或更多观测值

例如，下列数字显示实时动态(RTK)的出发点。这是一个可能的起点。


重新计算 - 如何确定所有可能的起点的位置

 概述和更多信息

起点的位置由被键入的坐标确定。一个可能的起点通常仅仅有一个被键入坐标的设置。每个位置部分的质量(NE,e,h)从被键入坐标的质量继承。如果不键入高程或高度部分，那么大地水准面模型用来导出缺少的部分。

一个点可以有多个被键入坐标的设置，如果：

  键入一个点的坐标并且进行平差(如果安装了网平差模块)没有固定点(产生一个点坐标的平差设置)

  输入WGS-84 坐标和点的格网控制坐标。

  输入一个WGS-84 坐标和高程。高程作为格网坐标的一部分被存储。

在这种情况中，重新计算使用某个标准确定作为计算位置使用的坐标。如果它不能找到用于第一个标准的单个坐标的设置，它使用下一个。标准,顺序,如下：

1.	坐标状态(启用/停用)

2.	最优质量部分

3.    WGS-84 坐标用于优先选择的格网坐标。


重新计算 - 如何确定所有可能起点的位置
重新计算 - 如何确定所有可能起点的位置 (1) 坐标的状态

 参见

坐标的状态(启用/停用)

确定起点的位置时，仅仅考虑被启用的坐标。如果观测值不用于点坐标，检查坐标仅仅用于确定起点的位置。

注：检查坐标很少用于起点坐标。

停用的坐标不被考虑。使用属性窗口或多重编辑对话框，启用或停用坐标。

最优质量分量

如果有多个被启用的坐标设置，对于一个点，重新计算采用所有可得到的键入坐标中的最优质量分量。三个分量是：

  平面

  高程

  高度

注：这些分量不必来自相同的坐标组。

下列表格显示三个部分的质量并且从最高到最低分等级。质量的顺序作为“质量层次”来参考。

在属性窗口中，质量的符号显示在每个分量的旁边。

坐标类型

如果两个坐标有相同的质量，使用坐标类型。 WGS-84坐标优先于格网/当地坐标被使用。


重新计算 - 分量质量如何确定当前的起点

 概述和更多信息

如果有多个可能的起点, 重新计算选择最高的质量点作为当前的起点。它使用下列层次：

1.	控制

2.	平差

3.	测量

4.	制图

5.	未知的

各个分量的质量被考虑。如果对于每个分量，点位置的质量是不同的，平面质量被认为第一，然后是高度和高程。

下列表格显示确定可能的起点成为当前的起点的质量层次的一部分(质量层次超出被显示的表格)。加阴影单元显示更适用于重新计算的质量：

例如,一个点有下列分量质量：

  平面质量-控制

  高度质量-未知的

  高程质量-未知的

然后在具有下列分量质量的点之前被用作起点：

  平面质量-测量

  高度质量-测量

  高程质量-制图

确保需要用作起点或发散点坐标的点含有控制质量的分量。

注：如果多个可能起点带有相同质量的分量，在项目的重新计算中使用第一个点。


重新计算 - 观测值如何从当前起点被使用

 概述和更多信息

重新计算根据观测值类型用不同的方法使用来自一个起点的观测值。它适用于：

  在WGS-84椭球上的GPS观测值。

  当地椭球上的常规的和激光测距仪观测值--除非不选择把地面观测值归算到椭球上(海平面改正)的选项。

这个选项位于项目属性对话框的重新计算标签。在这种情况下，重新计算使用地面水平面上的地面观测值。为了获得更多的信息，参见主题椭球水平改正。如果进行平差，所有的距离将被归算到椭球上。

  高程增量�用于初始重新计算的现有高程。(链接到主题重新计算-如何使用高程增量)


重新计算- 如何使用GPS观测值

 概述和更多信息

GPS观测值存储在Trimble Geomatics Office项目中作为地面到地面的矢量。但是，在这个区域中，GPS矢量从天线相位中心到天线相位中心( APC-APC )被观测。

在输入期间， Trimble Geomatics Office利用每个基线终点的GPS天线的天线高度把GPS矢量转换成地面到地面的矢量。如果编辑天线高度，自动更新地面到地面的矢量。

注：基线处理器产生地面到地面的矢量。

重新计算施行下列行动来确定使用GPS来观测的点的位置：

1.	把当前起点坐标转换成WGS-84纬度，经度，和高度( LLh )。

2.	把这些坐标转换成WGS-84笛卡尔坐标(X,Y,Z)。

3.	把地面到地面的GPS矢量(X增量，Y增量，和Z增量)用于起点的WGS-84笛卡尔坐标。

这为被观测点提供了一个笛卡尔WGS-84位置。

注：如果网平差参数用于项目中，使用的GPS矢量是平差矢量,即使基线没有用于网平差。

4.	把被观测的点转换成WGS-84纬度,经度,高度。

5.	对于项目，使用被选择的坐标系统得出来自于WGS-84位置的每个点的投影坐标。它也使用任何用于项目的GPS位置校准点。

6.	结果的坐标成为点的当前位置。


重新计算- GPS基线的方向

 概述和更多信息

在缺省的情况下，重新计算使用在被观测的矢量方向(基准站到流动站)上的所有实时动态( RTK )GPS观测值。

静态和快速静态后处理基线的方向由在基线处理时的观测值发散确定。方向存储在项目中，并且在图形窗口的基线中显示一个箭头。发散运算法则保证矢量从最高质量位置的点到最低质量位置的点来处理。重新计算使用存储在项目的方向矢量。

能改变GPS矢量的方向以便于重新计算使用相反方向的矢量。

为了做这个工作,选择观测值并且选择编辑/将观测值反向溢出。在这种情况下，确定点的矢量要从已知位置溢出，例如，被键入的WGS-84纬度，经度和高度坐标。如果点没有已知位置，观测值不被使用。


重新计算 - 如何使用常规的和激光测距仪观测值

 概述和更多信息

当输入常规观测值时：

  由于弯曲和折射引起的垂直角改正

  由于大气误差引起的斜距改正(百万分率改正)

  平面观测值被转换成来自后视点的平面角度

重新计算施行下列行动来确定常规测量或用激光测距仪的点的位置：

1.	做下列之一：

如果观测值是激光测距仪观测值，对于被观察的方位角，重新计算使用磁偏差。

如果观测值是常规的观测值，对于斜距，重新计算使用棱镜常数。

2.	它把测量得的斜距归算为水平的地面距离。

3.	在项目属性对话框的重新计算标签中，如果选择把地面观测值归算到椭球(海平面改正)的选项,它把地面距离归算为椭球距离。

4.	它把仪器高加到当地高中。

5.	它使用被定义的项目坐标系统来把当前起点转换成当地的纬度，经度，和高度(观测值沿着椭球被使用)。

6.	采用下列规则来确定后视点方位角(仅仅对于常规的观测值)：

  如果仅仅已知仪器点和后视点的位置，(即,没有被键入的方位角) 重新计算使用由两个点之间的逆确定的后视方位角。

  如果仅仅被键入的方位角是可使用的并且点没有坐标, 重新计算使用这个作为后视方位角。

  如果仪器点的位置和后视点是已知的,并且被键入的方位角是可使用的, 重新计算确定每个方位角的质量并且在下面表格中使用层次来确定作为后视方位角使用的方位角。

例如,如果一台测量-质量仪器和后视点对存在,与控制质量一起被键入的方位角, 被键入的方位角将被用于后视方位角。

注：计算后视方位角的质量, 检验仪器点和后视点的质量，去掉最低的质量。例如,如果仪器点有一个控制质量，后视点有一个制图质量, 后视方位角将有一个制图质量。

类型	质量
从坐标导出	质量
键入方位角	质量
从坐标导出	测量
键入方位角	测量
从坐标导出	制图
键入方位角	制图
注：如果需要重新计算优先于仪器和点之间被确定的方位角来使用被键入的方位角,增加被键入的方位角位置的质量以便在层次上高于仪器和后视点之间被确定的方位角。

提示： 能编辑被键入的方位角的质量。

7.	对于后视方位角，使用平面角度来确定格网方位角(仅仅对于常规的观测值)。

8.	对于磁方位角，使用磁偏差来确定格网方位角(仅仅对于激光)。

9.	使用沿着椭球的观测值来确定被观测点的当地纬度和经度。

10.	为了确定被观测点的高程, 从仪器高中减去目标高来求得高度增量。然后把这个值加到仪器安装点的高程上。

对于项目，使用被选择的坐标系统把坐标转换成当地的格网坐标。


重新计算 - 如何使用高程增量

在重新计算期间，高程增量被使用。重新计算进行以下操作来输出高程增量：

  确定起点高程。

  高程增量被用于起点确定新的点的高程。

在重新计算中，对于从它输出的高程增量，起点必须有一个被键入的高程。如果具有从它输出的高程增量的一个点没有高程，高程增量将不被用于重新计算。

注：如果起点的高程由输入的高程增量确定，高程增量不能从起点输出。

必须在水平面的起始处输入一个高程以保证高程增量能从水平面的起始处输出。

例如，在下面的图表中，对于点B，C和D使用高程增量观测值来确定的高程，点A必须有一个被键入的高程。


重新计算 - 示例

 概述和更多信息

下列图表是重新计算坐标点的示例。点A 和 I都是控制质量点,其余的点是测量质量。

重新计算建立和这些有被键入的坐标和输出的观测值的点一样的作为可能的起点的点A 和 I。点A 和 I质量相同(控制L,L,h)。因此，重新计算选择点A作为当前的起点，因为它首先输入项目中。

重新计算使用从起点到被观测点的坐标的所有观测值直到不能进一步进行。因此,下列点从点A开始被调整:B，C，D，E，F，G和H。

从当前起点(点A)开始没有更多的观测值,因此重新计算选择点I作为新的当前起点。重新计算调整从点I起的点J，K，和L。

有从点I到点D和H的观测值。重新计算已经调整了这些点，因此，显示这些点的闭合。如果闭合差大于项目属性对话框的重新计算标签的限差设置, 在图形窗口的被观测点上出现一个警告标志。闭合差在重新计算报告中给出。

警告：点D能从B和I的观测值中得出。来自于B的观测值被使用而不论这些观测值的质量。因为D从B开始被调整。如果想要保证从I开始的观测值被使用, 改变从B到D“作为检查激活的”观测值的状态。


重新计算 - 一个点的多个观测值和坐标

 概述和更多信息

一个点可以有到它的多个观测值及键入坐标。如果在项目属性对话框的重新计算标签中选择使用最好观测值选项，仅仅一个观测值或坐标能被用来导出一个点的位置分量(NE, e,h)。例如，一个点可以有到它的观测值和它的一个键入坐标。键入坐标优先于观测值坐标。其它不使用重新计算的观测值或键入坐标在重新计算报告中给出。

注：如果选择从相同类型观测值计算平均数选项(在项目属性对话框的重新计算标签中)，所有观测值能用于旁点观测点坐标分量的计算。只对旁点观测点进行平均。

一个点的多重观测值

为了确定对于一个具有多重观测值的被计算的坐标(当选择使用最好观测值选项时)，重新计算使用下列观测层次：

1.	观测值状态(激活的,作为检查激活的,停用的)

2.	观测值质量

3.	观测值类型( GPS ,常规的,激光的,归算的)

4.	精度

5.	项目中的第一个观测值


重新计算 - 旁点观测点的多个观测值

 概述和更多信息

当观测值( GPS 或常规的)被转移到 Trimble Geomatics Office中，软件确定每个观测值是否是旁点观测点。旁点观测值是一个点的观测值：

  没有从它开始的观测值

  没有到它结束的静态或快速静态观测值

  不是一个控制点

下列图形说明旁点观测点如何出现在两种不同的状况中。

图形说明旁点观测点如何出现在两种不同的状况中。

多个旁点观测值组的设置(在项目属性对话框的重新计算标签 中)用来确定计算旁点观测点位置的观测值。

注：重新计算不会将多个旁点观测值的高程平均。


重新计算 - 多重观测值和平均坐标

 概述和更多信息

在缺省的情况下，在项目属性对话框的重新计算标签中，从相同类型的观测值计算平均数选项不被选择。结果，不平均多重观测值。

如果确实选择这个选项，Trimble Geomatics Office需要从每个观测值到sideshot点的被计算坐标。

注：如果点是一个导线点，重新计算仅仅使用一个观测值或坐标来确定点的位置。

Sideshot点的平均位置的规则是：

重新计算仅仅需要相同类型的观测值。例如，GPS观测值不能与常规观测值取平均。在这种情况下，重新计算优先于常规观测值使用 GPS 观测值。

  重新计算仅仅需要从观测值导出的坐标。例如，如果一个点有两个观测值和被键入坐标，重新计算需要观测值，确定坐标和质量。然后比较被键入的坐标和平均坐标，使用最高质量的坐标作为点的位置。

注：如果有一个或更多启用的观测值，重新计算不使用启用的观测值作为检查来确定一个平均位置。

为了确定点的被计算位置，重新计算从到点的每个观测值计算位置。每个观测值根据它的精度值来加权。精度越高,有平均坐标值的观测值影响越大。

对于GPS观测值，重新计算使用精度区域。查看这个区域：

1.	选择 GPS观测值。

2.	打开属性窗口。

3.	单击观测值统计菜单按钮 [image] 。

对于常规观测值，使用相等的加权。

重新计算使用平均位置作为由容许距离来规定半径的一个圆的中心。这个距离被指定在项目属性对话框的重新计算标签中。如果坐标部分是水平的(北方向,东方向)，重新计算使用水平限差。如果坐标部分是垂直的(高程，或高度)，它使用垂直限差。

如果一个或更多的位置在限差规定的圆外面，距平均位置最远的位置被拒绝，并且重复处理。在下列图表中，一个sideshot点有三个常规观测值。

观测值3在限差圆外面,因此省略了下一次重复。

有剩余观测值，重复处理直到所有被计算的位置在限差圆以内。下列图表显示被计算的平均格网坐标如何成为点最后被计算的坐标。

所有用于确定平均坐标的观测值现在都在被指定的限差以内，因此，重新计算把这些平均坐标用于点的被计算位置。

注：如果在项目属性对话框的重新计算标签中清除使用限差检查复选框，所有相同类型的观测值将不进行限差检查而取平均。结果，超限将不能被检测。


重新计算 - 对导线点的多重观测值

  概述和更多信息

在测量导线中，导线点可以有对它的多个观测值。这被当为多重观测值。

对导线点的多重观测值不取平均。这显示在下列图表中。点1有两个对它的观测值，并且一个观测值来自它。用于导出点 1 的位置的观测值是定位点的第一个观测值。


重新计算 - 具有被键入的坐标和观测值的点

 概述和更多信息

对于一个点，被显示的位置能被导出，从：

  观测值

  被键入的坐标，例如，输入的格网坐标

如果一个点有到它的被键入的坐标和观测值，重新计算使用被键入的坐标和观测值的质量来确定点的位置。如果质量是相同的，它优先于来自观测值的坐标使用被键入的坐标。因此,如果想要使用一个点位置的观测值，保证选择比任何被键入的点坐标更高质量的观测值。

重新计算分别考虑平面部分质量和垂直部分质量。例如,对于一个点，被输入的格网坐标可以有测量质量平面部分(北方向,东方向)和制图质量高程部分。也有对一个点的观测值。从观测值是测量质量被导出的平面的和垂直的坐标。

这在下列表格中被总结。

表格71.doc被更新。

被遮的单元说明如何确定点的位置。平面部分质量是相同的。因此，重新计算优先于观测值使用坐标。被输入的坐标垂直部分低于观测值,因此，重新计算从观测值中求出高程。

使用任何可得到的被键入的坐标和点的观测值求出对于点的最好的高程或高度。如果重新计算使用观测值来计算点的高程或高度，再从下列之一来计算剩余的垂直部分：

  大地水准面模型和/或高程平差

  被键入的坐标

如果大地水准面模型被用于项目中，在项目属性对话框的重新计算标签中的大地水准面模型质量用来确定从大地水准面模型得出的高程或高度的质量。这个质量与任何被键入的坐标相比，使用最好质量的高程或高度部分。

注：大地水准面模型质量显示在属性窗口中。

注：如果来自于校准点的高程平差存在于项目坐标系统定义中，那么导出的高程或高度的质量将是测量。


重新计算 - 如何确定被观测的点的质量

 概述和更多信息

重新计算确定来自被观测点的质量的被观测点的质量，观测值的质量用于导出点的位置。它分别考虑平面的和垂直的部分。

质量层次是：

1.	控制

2.	测量

3.	制图

4.	未知的

下列表格说明如何确定来自解类型或测量类型的观测值质量。

观测值类型	分配到观测值的质量
固定的GPS	测量
浮动的GPS	制图
自动的GPS	未知的
常规的	测量
激光测距仪	制图
高程增量	测量

分配到点的每个部分的质量(平面的，高程，和高度)如下：

  来自被观测的观测值的点的质量

  观测值的质量


实时动态测量的自动基准位置

 概述和更多信息

如果使用 [image] 键入Trimble Survey Controller开始实时动态( RTK )基准并且把Survey Controller (.dc) 文件转移到 Trimble Geomatics Office中, 基准位置(因此所有来自基准的流动点)质量未知(对于所有部分;平面的，高度，和高程)。

如果使用 Trimble  Geomatics Office软件进行 GPS 测站校准，平面的和高度部分的质量不被改变。

如果确信GPS测站校准改进了点的质量，使用属性窗口改变基准点的质量。增加基准的质量将改进流动点的质量。

注：如果项目坐标系统定义中存在高程平差，高程部分的质量将是测量。


重新计算 - 使用Trimble Geomatics Office移动或平差的点

 概述和更多信息

重新计算不移动已经被平移了的点：

  移动坐标

  坐标转换

  高程平差

  网平差

当这些操作之一被用于一个点时，从观测值到点被导出的位置不被使用。


重新计算-项目高度

 概述和更多信息

项目高度是项目宽设置，用作没有高度的点的任何计算值的近似高度。没有高度的任何点得不到关于项目高度值的更新。它仅仅用于变换坐标，当：

  项目坐标系统被改变并且没有高度

  因为点没有高度，所以使用海平面改正值。

项目高度区域在项目属性对话框的坐标系统标签 中。


重新计算 - 检核观测值

 概述和更多信息

Trimble Survey Controller 存储点的检核观测值。当把.dc 文件输入到Trimble Geomatics Office时，下面描述如何处理这些点。

检核点到除键入的控制点以外的点

当导入.dc文件时，添加的点的计算位置利用点的观测值来导出。输入检核观测值，但是不用来确定点的被计算位置，除非在激活的状态下没有点的观测值(重新计算总是在激活作为检核观测值之前使用激活的观测值)。观测值被给一个激活作为检查的状态，并且在图形窗口中作为一条虚线显示。使用属性窗口的摘要页查看和编辑观测值的状态。计算被计算点的位置和由检核观测值确定的坐标之间的不闭合。这在重新计算报告中被报告，在输入期间产生，放于项目报告文件夹内的重新计算文件夹。

注：对一个被存储的点，如果存储一个检核观测值，那么删除以前被采集的点，输入检核观测值，一个新点增加。和检查一样激活的观测值残余状态，和点的被计算位置从观测值中导出。


Trimble 3600/5600 GDM � 概述
Trimble 3600/5600 GDM − 概述

可以在Trimble Geomatics Office 和Trimble 3600/5600仪器上的Trimble 3600/5600 GDM 控制单元之间转移数据。Trimble建议仪器要有固件632.11.00或更高版本。

可以从3600/5600 GDM Job (*.job) 文件和Area (*.are) 文件导入数据，并从当前的Trimble Geomatics Office项目导出数据到Area (*.are)文件。或者，直接用测量设备导入选项来导入或导出数据。

下表给出了可以在Trimble Geomatics Office和Trimble 3600/5600 GDM控制单元之间转移的文件类型：

导入	导出
.job − collected data from the Trimble 3600/5600 GDM control unit	无
.are − coordinate file	.are
无	.pco − 到 Trimble 3600/5600 GDM 控制单元
无	.uds − 用户定义的序列
要保证Trimble Geomatics Office正确地解释已导入 3600/5600 GDM文件，进行以下操作：

  	确保 Trimble 3600/5600 GDM控制单元把程序编号打开。

  	配置 Program�32以便存储斜距而不是水平和垂直距离。更多信息，参见Trimble 3600/5600 GDM控制单元文件。

  	要在Trimble Geomatics Office中显示Program 23和24观测值，Trimble 3600/5600 GDM 程序用户表必须在标准记录后面包括水平角度、垂直角度和斜距记录。有关修改用户表方法的更多信息，参见Trimble 3600/5600 GDM 控制单元文件。


用户定义的序列 (UDS) - 概述
用户定义的序列 (UDS) − 概述

用户定义的序列决定怎样在Trimble 3600/5600仪器上使用Trimble 3600/5600 GDM控制单元的域中采集和存储测量数据。每个序列都存储在用户定义的序列（*.uds）文件中。

UDS文件应该包含下列记录：

2	仪器站
3	仪器高度	(可选项)
62	后视点
21	后视方位角
5	点名字
6	目标高度	(可选项)
4	编码	(可选项)
7	水平角度
8	垂直角度
9	斜距
为了在域中使用用户定义的序列，用独立的数据传输程序把UDS文件传输到Trimble 3600/5600 GDM控制单元。（不能用Trimble Geomatics Office 导出对话框。） 更多信息，请参阅数据转移帮助。

一经采集和存储了测量数据，把它转移到Trimble Geomatics Office。

注：预定义的UDS文件在 Trimble Geomatics Office CD 上可用。

也请看


Pcode (*.pco) 文件

Pcode文件包含定义要素和属性的数字代码和字母数字描述。它们用于Trimble 3600/5600 仪器的Trimble 3600/5600 GDM控制单元中。当在域中采集数据以便快速定义已观测点时，可以输入编码。例如，如果Pcode文件包含“201”编码和 揟ree� 的描述，在域中可以输入“201”那么 揟ree� 将在控制单元上显示。

导出到Trimble 3600/5600 GDM控制单元的Pcode文件必须具有：

  带有小于256的数字代码

  总数少于800个字符的描述

要使用Pcode文件，从Trimble的要素和属性编辑器的要素和属性库中创建它，然后把它转移到控制单元。

也请看


面 (*.are) 文件

Trimble Geomatics Office支持来自Trimble 3600/5600 GDM 控制单元的面数据（*.are 文件）。

更多信息，请看：

  导入Trimble 3600/5600 GDM CU文件，如何

  导出到Trimble 3600/5600 GDM CU 格式，如何


任务(*.job)文件

Trimble Geomatics Office能够支持来自Trimble 3600/5600 GDM控制单元的任务数据 (*.job文件)。

更多信息，请看导入Trimble 3600/5600 GDM CU文件，如何