Copyright: © 1999-2002 Trimble Navigation Limited
Citation: © 1999-2002 Trimble Navigation Limited


Netzausgleichung - Inhalt
    Netzausgleichung − Inhalt

Folgende Themen sind verfügbar:

  Netzausgleichung

  Ausgleichungsdatum

  Ausgleichungsstile

  Punkte

  Beobachtungen

  Beobachtungsgruppen

  Gewichtungsstrategien

  Ausgleichen

  Kalibrierungskoordinaten

  Ausgleichung entfernen

  Netzausgleichungsbericht

Drücken Sie F1, um Informationen zur Verwendung der Hilfe zu erhalten.

Wenn Sie ein Problem haben, oder die von Ihnen benötigten Informationen nicht in diesem Hilfe-System finden können, schlagen Sie im Trimble Geomatics Office - Network Adjustment Software-Benutzerhandbuch nach oder setzen Sie sich mit Ihrer örtlichen Trimble-Vertretung oder mit der Technischen Unterstützung in Verbindung.

©1999-2002, Trimble Navigation Limited. Alle Rechte vorbehalten.


Netzausgleichung - Überblick
    Netzausgleichung − Überblick

Weitere Informationen

 Siehe auch

Überblick

Die Durchführung einer Ausgleichung der kleinsten Quadrate für Ihr Netz dient dazu:

  Zufallsfehler zu schätzen und zu entfernen

  eine einzige Lösung zu bieten, wenn redundante Daten vorhanden sind

  Korrekturen an den Beobachtungen zu minimieren

  grobe Fehler zu entdecken

  Informationen zur Analyse zu erstellen, einschließlich Genauigkeitsschätzungen

Vergewissern Sie sich nach erfolgreichem Abschluß einer Ausgleichung der kleinsten Quadrate, daß:

  die Festpunkte oder Beobachtungen keine groben oder systematischen Fehler enthalten.

  alle Fehler kleine Fehler oder Zufallsfehler sind und entsprechend verteilt sind.

Eine Ausgleichung der kleinsten Quadrate gewährleistet gute Positionsabschlüsse und Wiederholbarkeitsschätzungen. Sie stellt sicher, daß Ihre aktuellen und zukünftigen Messungen zuverlässig sind.

Ein Netz der kleinsten Quadrate muß folgende Kriterien erfüllen, damit eine erfolgreiche Ausgleichung durchgeführt werden kann:

  Das Netz muß geometrisch und mathematisch geschlossen sein.

  Die Summe der gewogenen Verbesserungsquadrate der Restwerte muss minimiert werden.

Ein Netz geometrisch zu schließen, bedeutet, das Netz mit einer guten, geschlossenen Geometrie zu entwerfen. Ein GPS- oder terrestrischer Netzentwurf besteht aus einem Satz von Beobachtungen zwischen Netzpunkten. Diese Beobachtungen sollten geschlossene geometrische Figuren bilden, z. B. Dreiecke.

Ein Netz mathematisch zu schließen, bedeutet, daß alle groben Fehler aus den Beobachtungen entfernt werden, um statistisch akzeptable Resultate zu gewährleisten.

Die Beschränkung der gewogene Verbesserungsquadrate auf ein Minimum entspricht dem mathematischen Abschluß eines Netzes insofern, daß die Summe der gewogene Verbesserungsquadrate der Beobachtungsrestwerte minimiert werden muß. Einfach ausgedrückt bedeutet dies, daß bei der Ausgleichung jeder einzelnen Beobachtung die gesamte Ausgleichung aller (quadrierten) Beobachtungen den kleinstmöglichen Wert aufweisen muß.

Die Trimble Geomatics Office Software prüft dieses Kriterium für Sie und informiert Sie über jede Beobachtung und alle Festpunkte, die diese Kriterien in der Netzausgleichung nicht erfüllen.

Wann und warum ein Netz ausgeglichen werden muß

Beginnen Sie mit der Netzausgleichung:

  nach der GPS-Basislinienverarbeitung (der Verarbeitung Ihrer GPS-Rohdaten)

  nachdem Sie Ihre RTK-Basislinien (mit QC1- & QC2-Daten) und/oder terrestrischen Daten importiert haben

  nachdem Sie Warnkennzeichnungen entfernt haben, die durch Fehler außerhalb der Toleranz verursacht wurden.

TIP: Trimble empfiehlt dringend, daß Sie Anhang A, ‘Ein Leitfaden zur Ausgleichung der kleinsten Quadrate im Trimble Geomatics Office– Network Adjustment Software-Benutzerhandbuch‘ lesen, bevor Sie mit der Netzausgleichung beginnen.

HINWEIS: Wenn Sie vor der Durchführung einer Netzausgleichung eine GPS-Kalibrierung abgeschlossen oder aus einer DC-Datei importiert haben, fordert die Software Sie auf, das Entfernen GPS-Kalibrierungsparameter zu bestätigen, bevor Sie mit der Ausgleichung beginnen. Die Trimble Geomatics Office Software läßt nicht zu, daß Transformationsparameter für eine Netzausgleichung und Kalibrierungsparameter einer GPS-Kalibrierung im selben Projekt verwendet werden. Es kann nur eine Parameterart verwendet werden.

Netzausgleichungsverfahren

Die beiden Hauptverfahren zur Netzausgleichung schließen folgende Schritte ein:

1.	Beginnen Sie mit einer minimal bedingten Ausgleichung (oder einer freien Ausgleichung, bei der innere Bedingungen verwendet werden), um Ihre Beobachtungen auszugleichen und eine Qualitätskontrollprüfung durchzuführen. Bei diesem Schritt wird/werden:

  die interne Konsistenz des Netzes geprüft

  grobe Fehler oder Ausreißer entdeckt

  genaue Fehlerschätzungen für Beobachtungen erhalten

2.	Führen Sie als zweiten Schritt eine vollständig bedingte Netzausgleichung durch. Bei diesem Schritt wird/werden:

  das Netz auf das bestehende Festpunktnetz bezogen (Datum)

  das bestehende Festpunktnetz verifiziert

  Transformationsparameter für das Netz erstellt

  genaue Koordinaten-Fehlerschätzungen erhalten

Informationen über die Durchführung einer Ausgleichung mit einer Kombination aus GPS- und terrestrischen Beobachtungen finden Sie unter dem Thema Unterschiedliche Beobachtungstypen in einer Netzausgleichung kombinieren.

HINWEIS: Nach einer minimal bedingte Ausgleichung der GPS-Beobachtungen im WGS-84 Datum, können Sie die WGS-84 Koordinaten der ausgeglichenen Punkte speichern. Diese WGS-84 Koordinaten werden als GPS-Punkte zur Verwendung in einer GPS-Kalibrierung gespeichert. Nach der Erstellung örtlicher Gitter-Koordinaten in einer vollständig bedingten Ausgleichung, die als Gitterpunkte in einer Kalibrierung verwendet werden können, können Sie eine Kalibrierung zur Verwendung im Feld (Abstecken) erstellen. Die Software fordert Sie auf, das Entfernen der Transformationsparameter für die Ausgleichung zu bestätigen, bevor mit der GPS-Kalibrierung begonnen werden kann. Vergewissern Sie sich, daß Sie die Netzausgleichung durchgeführt haben, bevor Sie mit einer GPS-Kalibrierung beginnen. Weitere Informationen finden Sie unter GPS-Kalibrierung.

HINWEIS: Wenn Sie eine Netzausgleichung mit Daten durchführen möchten, die von der Trimble Survey Controller Software übertragen wurden, vergewissern Sie sich, daß bei der Vermessung eine Druck-, Temperatur-, Krümmungs- und Refraktionskorrektur im Survey Controller-Vermessungsstil eingeben wurde.


Datum - Überblick
    Datum − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Im allgemeinen dient ein Datum als Referenzrahmen zur Bestimmung von Punktkoordinaten auf der Erdoberfläche. Verschiedene örtliche Datums werden auf der Welt verwendet, um die Koordinaten eines örtlichen Bereiches zu definieren. Es gibt darüber hinaus Weltdatums, die zur Definition von Koordinaten in verschiedenen Regionen der Welt verwendet werden. Die bekannten Festpunkte, die Sie bei Ihren Vermessungen verwenden, basieren in der Regel auf einem örtlichen Koordinatensystem, das auf ein örtliches Datum bezogen wird. Wenn Sie GPS-Beobachtungen im Feld aufzeichnen, werden diese Beobachtungen auf das Weltdatum WGS-84 bezogen.

Wenn Sie Ihr Projekt in der Trimble Geomatics Office Software erstellt haben und die Projekteigenschaften festlegen, sollten Sie ein Projektkoordinatensystem wählen, das auf ein bestimmtes örtliches Datum (Projektdatum) bezogen ist. Das Projektkoordinatensystem wird, zusammen mit dem Datum, zur Erstellung der Punktkoordinaten im Projekt verwendet.

Bevor Sie eine Netzausgleichung durchführen, können Sie das Datum für die minimal bedingten und die vollständig bedingten Ausgleichungsschritte wählen. Dieses Datum wird im Folgenden als Ausgleichungsdatum bezeichnet. Sie können WGS-84 oder das Projektdatum als Ausgleichungsdatum wählen. Die Wahl eines Ausgleichungsdatums gilt nur für die jeweilige Ausgleichung.

Verwenden Sie das WGS-84 Datum, wenn Sie eine minimal bedingte Ausgleichung für GPS-Beobachtungen durchführen. WGS-84 ist das vom Global Positioning System verwendete Datum. Wenn Sie ein anderes Datum verwenden, werden bei der Ausgleichung zu jeder Beobachtung mehr oder weniger große Restwerte hinzugefügt, um die Unterschiede im Referenzrahmen auszugleichen.

Sie müssen für jeden Augleichungsschritt das richtige Datum wählen, d. h.:

  Wählen Sie das WGS-84 Datum, bevor Sie eine minimal bedingte Ausgleichung mit GPS-Daten durchführen.

  Wählen Sie das Projektdatum, bevor Sie eine minimal bedingte Ausgleichung mit terrestrischen Daten durchführen (wenn das für die minimal bedingte Ausgleichung gewählte Datum nicht das Projektdatum ist, wird das Projektdatum vor der Durchführung der vollständig bedingten Ausgleichung gewählt).

HINWEIS: WGS-84 kann als Projektdatum verwendet werden. Bei einigen Vermessungen werden Festpunkte verwendet, die sich auf ein Koordinatensystem beziehen, das das WGS-84 Datum verwendet. In diesem Fall wird für die minimal bedingte und die vollständig bedingte Ausgleichung dasselbe Datum verwendet.

HINWEIS: Die Zusammenfassungen für Gitter-Koordinaten und örtliche Koordinaten werden im Eigenschaftsfenster immer unter Verwendung des gewählten Projekt-Koordinatensystems angezeigt. Wenn das WGS-84 Datum als Ausgleichungsdatum gewählt wird, ist die Anzeige der Gitter-Koordinaten und der örtlichen Koordinaten davon nicht betroffen.

Weitere Informationen finden Sie unter Ein Datum auswählen.


    WGS-84 Datum

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Verwenden Sie das WGS-84 Datum bei der Durchführung einer minimal bedingten Ausgleichung für GPS-Beobachtungen. Dieses Datum wird vom Global Positioning System verwendet.

Wenn ein anderes Datum bei der Ausgleichung von GPS-Basislinien verwendet wird, ergeben sich bei der Ausgleichung andere Gewichtungsresultate. Der Grund dafür ist, daß bei der Erstellung der Basislinien die Datumsunterschiede in den Beobachtungen enthalten sind.

Weitere Informationen finden Sie unter Ein Datum auswählen.


    Projektdatum

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Das Projektdatum wird im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt.

Wählen Sie nach der Durchführung einer minimal bedingten Ausgleichung das Projektdatum als Ausgleichungsdatum.

Bei der vollständig bedingten Ausgleichung werden die Transformationsparameter angewendet, die erforderlich sind, um:

 Ihre GPS-Beobachtungen (WGS-84) auf das örtliche Koordinatensystem (Projektdatum) zu beziehen

 die terrestrischen Beobachtungen auf das örtliche Festpunktnetz zu beziehen.

Bei diesem Ausgleichungsschritt können Sie Festpunktkoordinaten festhalten, die auf das Projektdatum bezogen sind. Sie können also Ihre auf WGS-84 bezogenen GPS-Beobachtungen auf das von Ihnen gewählte Projektdatum beziehen.

Weitere Informationen finden Sie unter Ein Datum auswählen.


Beobachtungsgruppen - Überblick
    Beobachtungsgruppen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Die Netzausgleichungssoftware (Network Adjustment Modul) der Trimble Geomatics Office Software ermöglicht Ihnen die Einteilung bestimmter Beobachtungssätze in Gruppen. Sie können folgende Gruppen erstellen:

  Varianzgruppen

  Transformationsgruppen

Die Einteilung von Beobachtungen in Gruppen ermöglicht Ihnen eine bessere Bewertung der in einem Beobachtungstyp enthaltenen Fehler.

Varianzgruppen

Bei Vermessungen werden oft verschiedene Gruppen von Messungen in einem einzigen Netz verwendet. Bei der Ausgleichung müssen die unterschiedlichen Fehler, die mit diesen GPS-Messungen verbunden sind, berücksichtigt werden. Die Trimble Geomatics Office Software verwendet Varianzgruppen, um diese Messungen in Gruppen aufzuteilen.

Je genauer die Vermessungsmethoden sind, desto geringer sind verständlicherweise auch die Meßfehler.

Das Ausgleichungsprogramm legt einen separaten Referenzfaktor und unterschiedliche Freiheitsgrade für jede Gruppe fest. Dies veranschaulicht, wie jede Gruppe zur gesamten Netzausgleichung beiträgt. Jede Gruppe kann mit Hilfe der Option Varianzgruppen, die im Dialogfeld Gewichtungsstrategien unter Skalare anwenden auf festgelegt wird, individuell skaliert werden.

GPS-, terrestrische und Geoid-Beobachtungen sind gemäß Voreinstellung automatisch in voreingestellte Varianzgruppen unterteilt: die Gruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> und <Geoid-Voreinstellung>.

HINWEIS: Die Gruppe <Geoid-Voreinstellung> ist immer die einzig verfügbare Geoid-Varianzgruppe in der Netzausgleichung. Da dieselbe Interpolationsmethode für alle Beobachtungen im selben Geoid-Modell verwendet wird, ist eine Einteilung der Beobachtungen in mehrere Gruppen nicht erforderlich.

HINWEIS: Für Beobachtungen auf sehr kurzen Basislinien (< 25 Meter) empfiehlt Trimble, eine separate Varianzgruppe zu erstellen, damit diese Beobachtungen getrennt skaliert werden.

Transformationsgruppen

Eine Transformationsgruppe ist eine Auswahl von Beobachtungen, auf die bei einer Ausgleichung dieselbe Transformation bzw. derselbe Satz von Transformationsparametern angewendet wird. Jede Transformationsgruppe verfügt über einen Satz von Transformationsparametern, die individuell oder in Sätzen angewendet werden können, um die Beobachtungen in einer Transformationsgruppe zu transformieren.

Sie können die Transformationen, die auf eine Gruppe angewendet werden sollen, steuern, indem Sie einen oder mehrere Transformationsparameter festlegen. Wenn Sie Transformationen lediglich auf Ablenkungsparameter anwenden möchten, können Sie den Status eines Ablenkungsparameters auf ‘Berechnet‘ und die anderen Parameter auf ‘Nicht verwendet‘ einstellen.

Gemäß Voreinstellung sind folgende Transformationsparameter für Transformationsgruppen mit GPS-Beobachtungen auf ‘Berechnet‘ eingestellt:

   Längengrad-Ablenkung

   Breitengrad-Ablenkung

   Azimut-Rotation

   Netzmaßstab

Gemäß Voreinstellung wird nur die Azimut-Rotation für terrestrische Beobachtungen auf Berechnet eingestellt. Andere Parameter können auf Benutzerdefiniert oder Berechnet eingestellt werden, sie werden jedoch nur verwendet, wenn ein systematischer Fehler in den Beobachtungen enthalten ist. Wenn z. B. eine Ausgleichung durchgeführt wird, und alle mit terrestrischen Methoden gemessenen Strecken einen Restwert von +3 ppm aufweisen, könnte der Parameter Streckenmaßstab berechnet werden, weil offensichtlich ein systematischer Fehler bei der Datenerfassung aufgetreten ist. Dieser systematische Fehler kann verursacht werden, wenn die ppm-Einstellung auf dem EDM nicht angewendet wird.

HINWEIS: Sie können in der Trimble Geomatics Office Software benutzerdefinierte Transformationsparameter eingeben. Sie sollten mit der Verwendung von Transformationsparametern vollständig vertraut sein, bevor Sie Parameterwerte manuell eingeben.

Weitere Informationen über Transformationsparameter finden Sie unter dem Thema Transformationsparameter - Überblick.


Netzausgleichungsbericht - Überblick
    Netzausgleichungsbericht − Überblick

Weitere Informationen

Siehe auch	Dialogfeld
Überblick

Verwenden Sie diesen Bericht, um Meldungen und Statistiken anzusehen, die während der Durchführung von Netzausgleichungen erzeugt wurden.

So greifen Sie auf den Netzausgleichungsbericht zu:

  Wählen Sie Berichte / Bericht Netzausgleichung.

Das für Ihren Computer voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht wird angezeigt.

Wenn der Bericht erscheint, können Sie die Befehle Ihres HTML-Anzeigemoduls verwenden, um zu folgenden Abschnitten zu navigieren:

  Ausgleichungsstil-Einstellungen

  Restwert-Toleranzen

  Kovarianz-Anzeige

  Ausgleichungssteuerungen [Terrestrische Steuerungen]

  Standpunktfehler

  Statistische Zusammenfassung

  Anzahl Iterationen

  Globale Statistik

  GPS-Beobachtungsstatistik

  Geoid-Modell-Statistik

  Terrestrische Beobachtungsstatistik

  Gewichtungsstrategien

  Ausgeglichene Koordinaten

  Gitternetz-Koordinaten

  Geodätische Koordinaten

  Koordinaten-Deltas

  Festpunktkoordinatenvergleiche

  Ausgeglichene Beobachtungen

  GPS-Beobachtungen

  Geoid-Beobachtungen

  Terrestrische Beobachtungen

  Histogramme der standardisierten Restwerte

  Punktfehlerellipsen

  Kovarianzwerte

Richtlinien für die Bewertung von Berichtstatistiken finden Sie unter den vorstehend genannten Themen.

HINWEIS: Sie können Beobachtungen mit Ausreißern in der Vermessungsansicht wählen, indem Sie sie im Netzausgleichungsbericht wählen. Wählen Sie dazu die Beobachtungs-ID im Netzausgleichungsbericht (verwenden Sie die Taste Strg, um mehrere Beobachtungen zu wählen). Die aktuelle Auswahl in der Vermessungsansicht wird rückgängig gemacht, und die im Bericht gewählte(n) Beobachtung(en) werden angezeigt.


Ausgleichen - Überblick
    Ausgleichen − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Verwenden Sie den Befehl Ausgleichen, um mit der Ausgleichung zu beginnen.

Führen Sie einen der nachfolgenden Schritte aus, um die Ausgleichung zu starten:

  Wählen Sie in der Vermessungsansicht Ausgleichung / Ausgleichen.

  Drücken Sie F10.

  Wählen Sie die Gruppe Ausgleichung in der Projektleiste, und klicken Sie auf das Symbol Ausgleichen.

Alle Ausgleichungsiterationen werden automatisch durchgeführt, wenn der Ausgleichungsprozeß beginnt. Verwenden Sie die Statusleiste, um den Status der Netzausgleichung zu verfolgen. Dort werden Meldungen für jede durchgeführte Ausgleichungsiteration angezeigt.

In der Regel führt das Ausgleichungsprogramm die im Ausgleichungsstil festgelegte maximale Anzahl von Iterationen aus. Bei jeder Iteration wird der Restwert der einzelnen Beobachtungen geprüft, um festzustellen, ob er mit der im Ausgleichungsstil festgelegten Toleranz übereinstimmt. Wenn die Konvergenz des Netzes erreicht ist, bevor die maximale Anzahl der Iterationen ausgeführt wurde, werden die Ausgleichungsiterationen beendet.

Wenn die Beobachtungsrestwerte die Kriterien der Akzeptanzprüfung bestehen, konvergiert das Netz und folgende Funktionen werden ausgeführt:

  Die ausgeglichenen Werte aller in der Netzausgleichung enthaltenen Punkte werden als aktuelle Koordinatenwerte mit der Punktqualität ‘Ausgeglichen‘ im Projekt gespeichert.

  Ein zusätzlicher Koordinaten-Unterdatensatz wird für jeden Punkt in der Ausgleichung erstellt. Folgende Kriterien werden dabei zugrundegelegt:

  Wenn ein Punkt in der Ausgleichung festgehalten und nicht mit Hilfe eines NGS-Datenblattes oder als Festpunkt aus einer ASCII-Datei importiert wird, wird ebenfalls ein Unterdatensatz ‘Im Büro eingegebene Koordinaten‘ gespeichert.

  Die Ausgleichungswerte der in der Netzausgleichung enthaltenen Punkte werden zu Koordinatenwerten und erhalten die Punktqualität ‘Ausgeglichen‘. Festgehaltene Punktkoordinaten und deren Punktqualität (Festpunkt) werden, wie zuvor eingegeben, beibehalten.

  Eine Seite mit Ausgleichungskoordinaten wird für jeden in der Ausgleichung enthaltenen Punkt erstellt. Allen nicht bedingten Punktkomponenten wird die Punktqualität ‘Ausgeglichen‘ zugewiesen. Alle bedingten Komponenten sind Null.

  Eine Neuberechnung wird automatisch durchgeführt. Bei der Neuberechnung werden neue Koordinaten für alle ausgeglichenen Punkte bestimmt. Die neuen Koordinaten werden, ausgehend von den ausgeglichenen (und festgehaltenen) Koordinaten, berechnet.

  Die Symbole für die ausgeglichenen Punkte werden zu ausgefüllten gelben Kreisen.

  Fehlerellipsen und Pfeile werden für jeden in der Ausgleichung enthaltenen Punkt erstellt.

  Alle anderen Punkte in der Netzausgleichung werden gespeichert.

  Die Symbole für die ausgeglichenen Punkte ändern sich – ausgefüllte gelbe Kreise erscheinen, wenn das Graphikfenster einen schwarzen Hintergrund aufweist. Ausgefüllte schwarze Kreise werden auf einem Standardhintergrund angezeigt.

  Fehlerellipsen werden für jeden ausgeglichenen Punkt in der Ausgleichung erstellt (nicht für festgehaltene horizontale Punkte).

Die ausgeglichenen Werte der einzelnen Punkte können in der Seite Eigenschaften angesehen werden. Wenn die Anzeigeoption für Fehlerellipsen aktiviert ist, werden die Ellipsen an jedem ausgeglichenen Punkt im Graphikfenster angezeigt.

Sie können nun mit der Analyse der Netzausgleichungsresultate beginnen, indem Sie sich den Netzausgleichungsbericht ansehen.


Gewichtungsstrategien - Überblick
    Gewichtungsstrategien − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Mit Hilfe von Gewichtungsstrategien können Sie die Gewichtungs- und Skalierungsmethode für jeden (GPS-, terrestrischen und Geoid-) Beobachtungstyp definieren. Die Trimble Geomatics Office Software läßt Sie separate Gewichtungsstrategien für jeden Beobachtungstyp festlegen.

Es ist wichtig, jede Beobachtung im Hinblick auf ihren Beobachtungstyp und die Beobachtungsqualität zu gewichten, damit bei der Ausgleichung der in jeder Beobachtung enthaltene a priori Fehler korrekt skaliert werden kann. Bei der Definition von Gewichtungsstrategien können Sie einen Skalar auf folgende Beobachtungen anwenden:

  Alle Beobachtungen

  Jede Beobachtung

  Varianzgruppen

In der Regel wird der Skalartyp, abhängig von den verwendeten Vermessungsmethoden, auf alle Beobachtungen oder Varianzgruppen angewendet. Ein Skalar wird normalerweise nur für Analysezwecke auf jede Beobachtung angewendet. Es kann jedoch hilfreich sein, den Skalar auf jede Beobachtung anzuwenden, um einzelne Beobachtungen zu finden, die in Ihrer Netzausgleichung Probleme bereiten.

Wenn eine Methode zur Anwendung eines Skalarwerts gewählt wurde, können Sie den Skalartyp für die Ausgleichung definieren. Folgende Skalartypen können gewählt werden:

  Voreinstellung

  Alternativ

  Benutzerdefiniert

  Automatisch

In einigen Ausgleichungen kann der berechnete a priori Fehler unterschätzt werden. Die Verwendung der korrekten Ausgleichungsstrategie ermöglicht es Ihnen, die a priori Fehlerschätzungen zu skalieren, um korrekte Fehlerschätzungen für alle Beobachtungen zu erhalten.

Wenn Sie mit einer Ausgleichung beginnen, ist die Gewichtungsstrategie so eingestellt, daß der Skalartyp ‘Voreingestellt‘ auf alle Beobachtungen angewendet wird. Dieser Skalartyp multipliziert den a priori Fehler mit dem Wert 1,00, ohne daß die Fehlerschätzungen dabei verändert werden.

Wenn der geschätzte Fehler in Ihren Beobachtungen mit dem tatsächlichen Fehler übereinstimmt, sollte der Referenzfaktor ungefähr bei 1,00 liegen. Wenn die Ausgleichung durchgeführt wurde, und Sie feststellen, daß der Referenzfaktor nicht nahe 1,00 liegt, ist eine Skalierung erforderlich, um eine Übereinstimmung zwischen dem geschätzten Fehler und dem tatsächlichen Fehler herbeizuführen. Die einfachste Art, einen Skalar anzuwenden, ist die Wahl des Skalartyps ‘Alternativ‘. Dieser Skalartyp benutzt den Referenzfaktor der aktuellen Ausgleichung und multipliziert ihn mit dem vorherigen Skalar, um die Skalare für die nächste Ausgleichung zu bestimmen. Dadurch wird der Referenzfaktor effektiv einem Wert von 1,00 angenähert. Der Alternative Skalar wird so lange auf nachfolgende Ausgleichungsiterationen angewendet, bis der Referenzfaktor ungefähr bei 1,00 liegt, und der Chi-Quadrat Test bestanden ist. Bei der Verwendung des Skalartyps Automatisch wird dieser Vorgang automatisch durchgeführt.

HINWEIS: Der Referenzfaktor der ersten Ausgleichung muß einen akzeptablen Wert aufweisen, bevor der Skalartyp ‘Alternativ‘ verwendet werden kann. Ein hoher Referenzfaktor weist normalerweise auf einen groben Fehler in der Ausgleichung hin. Überprüfen Sie die Ausgleichung auf Ausreißer (Beobachtungen mit hohen Restwerten), bevor Sie mit der nächsten Ausgleichung beginnen. Wenn Sie den Skalartyp ‘Alternativ‘ auf eine Ausgleichung mit einem hohen Referenzfaktor anwenden, ist der Skalarwert zu hoch.

Wenn der Referenzfaktor akzeptabel und der Chi-Quadrat Test bestanden ist, können Sie den zuletzt berechneten Skalar sperren. Wenn der Skalar gesperrt wird, wird der Skalartyp automatisch auf ‘Benutzerdefiniert‘ eingestellt.

ACHTUNG: Seien Sie bei der Auswahl des Skalartyps ‘Benutzerdefiniert‘ und bei der Eingabe von Skalarwerten vorsichtig. Sie sollten mit Fehlerschätzungen, Gewichtungsstrategien und Skalaren vollständig vertraut sein, bevor Sie den benutzerdefinierten Skalartyp verwenden.


Befehle - Überblick
    Befehle − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Das Ausgleichungsmenü enthält alle zur Durchführung einer Netzausgleichung erforderlichen Befehle. Der Befehl zur Erstellung eines Netzausgleichungsberichts befindet sich im Menü Berichte. Die Netzausgleichungsbefehle sind in der allgemeinen Reihenfolge aufgelistet, die zur Durchführung der einzelnen Ausgleichungsschritte erforderlich sind. Verwenden Sie die Reihenfolge der Netzausgleichungsbefehle als Orientierung, um sich durch eine Netzausgleichung führen zu lassen.

Folgende Befehle sind im Menü Ausgleichung verfügbar:

  Datum

  WGS-84 (Datum)

  Projektdatum

  Ausgleichungsstile

  Punkte

  Beobachtungen

  Beobachtungsgruppen

  Transformationsgruppen

  Varianzgruppen

  Gewichtungsstrategien

  Ausgleichen

  Kalibrierungskoordinaten

  Speichern (Kalibrierungskoordinaten)

  Entfernen (Kalibrierungskoordinaten)

  Ausgleichung entfernen

Dieser Befehl ist im Untermenü Ansicht / Symbolleisten verfügbar:

  Ellipsenparameter

HINWEIS: Der Befehl Fehlerellipsen entspricht der Auswahl des Kontrollkästchens Punktfehlerellipsen & Pfeile anzeigen im Dialogfeld Ansichtsoptionen, Register Fehlerellipsen-Steuerungen.

Die Ellipsenparameter-Symbolleiste enthält folgende Befehlsschaltflächen:

  Fehlerellipsen

  Ellips. Höhenfehler

  Höhenfehler

Dieser Befehl ist im Menü Berichte verfügbar:

  Bericht Netzausgleichung

Dieser Befehl ist im Dialogfeld Beobachtungen verfügbar:

  Beobachtung deaktivieren

HINWEIS: Der Befehl Beobachtungen deaktivieren entspricht dem Ändern des Beobachtungsstatus auf ‘Deaktiviert‘ im Eigenschaftsfenster. Deaktivierte Beobachtungen können nur im Eigenschaftsfenster erneut aktiviert werden. Weitere Informationen finden Sie unter Beobachtungen deaktivieren und Deaktivierte Beobachtungen erneut aktivieren.


Transformationsparameter - Überblick
    Transformationsparameter − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Transformationen werden bei einer vollständig bedingten Ausgleichung auf der Grundlage der Transformationsparameter-Einstellungen auf individuelle Transformationsgruppen angewendet. Jede Transformationsgruppe enthält eine Auswahl von GPS-, terrestrischen oder Geoid-Beobachtungen und einen zugewiesenen Satz von Transformationsparametern, die, nachdem sie berechnet wurden, auf die Beobachtungen in den Transformationsgruppen angewendet werden können.

Jede Transformationsgruppe verfügt über sieben Parameter. Diese sieben Transformationsparameter enthalten je ein Wertefeld, das optional zur Definition des Parameterwerts für eine vollständig bedingte Ausgleichung verwendet werden kann. Jedes Wertefeld ist mit einer Status-Einstellung verknüpft, die bestimmt, ob der im Wertefeld enthaltene Wert auf ‘Nicht verwendet‘, ‘Berechnet‘ oder ‘Benutzerdefiniert‘ eingestellt ist.

Die folgenden sieben Parameter sind verfügbar:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

Die ersten vier Parameter werden im Allgemeinen für Datum-Transformationen verwendet, z. B. um das WGS-84 Datum zu einem (örtlichen) Projektdatum zu transformieren. Die Ablenkungen beschreiben die Neigung der Ebene. Die Azimut-Rotation wird auf Azimute angewendet. Der Netzmaßstab wird auf alle linearen (Strecken- und ellips. Höhen-) Beobachtungen angewendet.

Die letzten drei Parameter werden in der Regel benutzt, um mögliche systematische Fehler in einer Beoachtungsgruppe aufzulösen.

Gemäß Voreinstellung sind folgende Transformationsparameter für Transformationsgruppen mit GPS-Beobachtungen auf ‘Berechnet‘ eingestellt:

   Längengrad-Ablenkung

   Breitengrad-Ablenkung

   Azimut-Rotation

   Netzmaßstab

Gemäß Voreinstellung wird nur die Azimut-Rotation für terrestrische Beobachtungen auf Berechnet eingestellt. Andere Parameter können auf Benutzerdefiniert oder Berechnet eingestellt werden, sie werden jedoch nur verwendet, wenn ein systematischer Fehler in den Beobachtungen enthalten ist. Wenn z. B. eine Ausgleichung durchgeführt wird und alle mit terrestrischen Methoden gemessenen Strecken einen Restwert von +3 ppm aufweisen, könnte der Parameter Streckenmaßstab berechnet werden, weil offensichtlich ein systematischer Fehler bei der Datenerfassung aufgetreten ist. Dieser systematische Fehler kann verursacht werden, wenn die ppm-Einstellung auf dem EDM nicht angewendet wird.

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet.

Wenn der Parameterstatus auf ‘Berechnet‘ eingestellt ist, bedeutet dies nicht, daß der Parameter berechnet ist und bei der vollständig bedingten Ausgleichung angewendet wird. Die Software bewertet die Anzahl der Bedingungen im Netz und bestimmt, ob die erforderliche Anzahl von Bedingungen zur Berechnung eines Parameters vorhanden ist. Für Ablenkungsparameter müssen mindestens drei vertikale Koordinaten im Netz festgehalten werden. Wurden weniger als drei Koordinaten festgehalten, werden die Ablenkungsparameter weder berechnet noch angewendet.

Mit der Option ‘Benutzerdefiniert‘ können Sie einige oder alle Transformationen definieren, die auf eine Transformationsgruppe angewendet werden. Wenn der Status auf ‘Benutzerdefiniert‘ eingestellt ist, wird der eingegebene Wert auf die Beobachtung angewendet und nicht bei der Ausgleichung berechnet.

HINWEIS: Obwohl Ihnen die Trimble Geomatics Office Software die Eingabe benutzerdefinierter Transformationsparameter ermöglicht, sollten Sie mit der Verwendung von Transformationsparametern vollständig vertraut sein, bevor Sie versuchen, diese Parameter zu definieren.

Wenn ein Netzausgleichungsbericht erzeugt wird, schreibt der Parameterstatus vor, wie der Wert im Bericht angegeben wird, z. B.:

  Wenn der Status eines beliebigen Parameters auf ‘Nicht verwendet‘ eingestellt wurde, erscheint der Parameterwert nicht im Abschnitt Ausgeglichene Beobachtungen des Ausgleichungsberichts.

  Wenn der Status eines beliebigen Parameters auf ‘Berechnet‘ eingestellt wurde, die Ausgleichung aber aufgrund unzureichender Bedingungen keinen Parameterwert berechnen konnte, ist im Berichtsabschnitt Ausgeglichene Beobachtungen kein Parameterwert enthalten. Wenn die Parameter berechnet werden konnten, wird der entsprechende Parameterwert im Abschnitt Ausgeglichene Beobachtungen des Ausgleichungsberichts angezeigt.

  Wenn der Status eines beliebigen Parameters auf ‘Benutzerdefiniert‘ eingestellt wurde, ist der eingegebene Parameterwert, unabhängig von der Anzahl der Bedingungen, im Bericht enthalten.

TIP: Sie können die Transformationsparameter auch im Register Ausgleichung ansehen, indem Sie im Register Koordinatensystem im Dialogfeld Projekteigenschaften auf Details klicken.

HINWEIS: Die Beobachtung wird im Eigenschaftsfenster angezeigt, wenn sie ausgewählt wird. Eine ausgeglichene oder transformierte Beobachtung kann nicht im Eigenschaftsfenster angesehen werden.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


Kalibrierungskoordinaten - Überblick
    Kalibrierungskoordinaten − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Durch das Speichern von Kalbrierungskoordinaten können GPS-Koordinaten im WGS-84 Datum für einen Punkt gespeichert werden. Diese Koordinaten können gespeichert werden, nachdem eine minimal bedingte Ausgleichung beendet ist. Nach der Durchführung der vollständig bedingten Ausgleichung können Gitternetz-Koordinaten für einen Punkt gespeichert werden.

HINWEIS: Die Option Kalibrierungskoordinaten speichern steht nur zur Verfügung, wenn das Ausgleichungsdatum auf WGS-84 eingestellt ist und nur GPS-Beobachtungen ausgeglichen wurden.

Die beiden nachstehenden Optionen sind zur Erstellung von Kalibrierungskoordinaten verfügbar:

  Bestehende Punkte

  Neue Punkte mit Suffix

Die Gruppe Koordinaten für Kalibrierung speichern enthält folgende Optionen:

Bestehende Punkte

Wenn Sie die Koordinaten als Bestehende Punkte speichern möchten, werden sie in dem entsprechenden Punktdatensatz gespeichert. Die Koordinaten werden nur zur Ableitung der Punktposition verwendet, wenn keine anderen Vermessungsdaten zur Verfügung stehen. Sie werden nur für die Kalibrierung gespeichert.

Wenn die Punkte als bestehende Punkte gespeichert werden, wird die Punktliste im Dialogfeld GPS-Kalibrierung automatisch ausgefüllt.

Neue Punkte mit Suffix

Wenn Sie die Koordinaten als Neue Punkte mit Suffix speichern möchten, wird ein neuer Punktdatensatz mit der Punktbezeichnung "<Punktname>-GPS" erstellt. Die Koordinaten können ebenfalls zur Ableitung der Punktposition verwendet werden, wenn keine anderen Vermessungsdaten zur Verfügung stehen. Sie werden nur für die Kalibrierung gespeichert.

Verwenden Sie diese Option, um die GPS- und Gitterpunkte für eine GPS-Kalibrierung als getrennte Elemente beizubehalten.

Kalibrierungskoordinaten ansehen

Nachdem Kalibrierungskoordinaten im Projekt gespeichert wurden, können Sie die Eigenschaften der Kalibrierungspunkte im Eigenschaftsfenster ansehen.

Kalibrierungskoordinaten entfernen

Kalibrierungskoordinaten können auch entfernt werden. Wenn der Befehl Kalibrierungskoordinaten im Menü Ausgleichung gewählt wird, wird ein Untermenü mit dem Befehl Entfernen angezeigt, mit dem die Kalibrierungskoordinaten aus dem Projekt entfernt werden können.


    Bei der Netzausgleichung erstellte Koordinatenseiten

Weitere Informationen

 Siehe auch

Bei einer Netzausgleichung werden ausgeglichene Koordinaten für alle nicht bedingten Punkte in der Ausgleichung erstellt. Sie können die ausgeglichenen Koordinaten im Eigenschaftsfenster ansehen.

Die ausgeglichene Koordinate wird im aktuellen Ausgleichungsdatum erstellt, z. B.:

  Wenn eine Netzausgleichung im WGS-84 Datum durchgeführt wird, wird eine ausgeglichene WGS-84 Koordinate erstellt.

  Wenn die Netzausgleichung im Projektdatum durchgeführt wird, wird eine ausgeglichene Gitternetz-Koordinate erstellt.

HINWEIS: Koordinaten, die im Dialogfeld Punkte festgehalten wurden, wird die Qualität festgehaltener Festpunkt zugewiesen.  Sie können diese Koordinaten nicht bearbeiten.

Koordinaten mit der Qualität Ausgeglichen haben Vorrang vor nicht bedingten Festpunktkoordinaten verwendet. Sie werden vor weiteren Ausgleichungen entfernt. Sie werden ebenfalls entfernt, wenn die Ausgleichung entfernt wird.


Warum homogene Koordinaten in Netzausgleichungen erforderlich sind
Warum homogene Koordinaten für eine Netzausgleichung erforderlich sind

Bevor Sie die Daten im Trimble Geomatics Office Projekt ausgleichen, müssen Sie zuerst Festpunkte mit guter Qualität importieren. Dies ist der Fall, da nach dem Importieren der Daten eine Neuberechnung durchgeführt werden muß, um die berechnete Position der importierten Punkte zu bestimmen und die Software die Festpunkte für ihre Berechnungen verwendet.

Schlecht fortgepflanzte Koordinaten können bei der Berechnung von Basislinien zu einer falschen Skalierung der Beobachtungen führen. Dies führt zu fehlerhaften Resultaten bei der Netzausgleichung. Bei der Modellierung der Basislinien werden durch Fehler in den vertikalen Koordinaten Skalierungsfehler erzeugt.

Damit keine schlechten Koordinaten in der Ausgleichung enthalten sind, sollten Sie sich vergewissern, daß:

  Beobachtungen von einer Koordinate mit bestmöglicher Qualität verwendet werden

  die Daten homogen sind, d. h. keine groben Abschlußfehler in den Daten enthalten sind

Wenn Sie versuchen, eine Ausgleichung durchzuführen und Abschlußfehler im Projekt enthalten sind, erscheint ein Warndialogfeld, das angibt, daß die Daten nicht homogen sind. Entfernen Sie alle nicht-homogenen Daten, bevor Sie eine minimal bedingte Ausgleichung durchführen.

HINWEIS: Die Software überprüft bei einer Ausgleichung nur dann, ob die Daten homogen sind, wenn voreingestellte Skalare verwendet werden. Wenn Sie Daten bearbeiten und eine weitere Ausgleichung durchführen möchten, vergewissern Sie sich, daß der Skalartyp Voreinstellung (in den Registern GPS, Terrestrisch und Geoid) im Dialogfeld Gewichtungsstrategien eingestellt ist.


Fehlermeldungen Ausgleichung gescheitert

Überblick

Folgende Fehlermeldungen können angezeigt werden, wenn eine Ausgleichung durchgeführt wird:

  Ausgleichung gescheitert − Keine Konvergenz

  Ausgleichung gescheitert − Horizontale oder vertikale Koordinate instabil

  Ausgleichung gescheitert − Instabile Transformation

Alle drei Fehlermeldungen können aus unterschiedlichen Gründen bei einer Ausgleichung angezeigt werden. Verwenden Sie diese Meldungen, um Punkte zu identifizieren, die in der Ausgleichung Probleme bereiten, und überprüfen Sie dann die Daten.

Ausgleichung gescheitert − Keine Konvergenz

Eine Ausgleichung ist beendet, wenn sich die Koordinaten der ausgeglichenen Punkte bei den Ausgleichungsiterationen nicht mehr verändern. Diese Meldung erscheint, wenn sich die Punktkoordinaten in der Ausgleichung zu stark verändern, (um einen Wert, der größer ist, als die Restwert-Toleranzen). Ein grober Fehler könnte in den Daten enthalten sein, der dazu führt, daß die Ausgleichung nicht konvergiert, z. B.:

  es gibt große Unterschiede zwischen den unausgeglichenen Koordinaten und den ausgeglichenen Werten eines Punktes

  es können Fehler in den Beobachtungen enthalten sein (z. B. wenn ein beobachteter Azimut um 180 Grad falsch ist).

Vergewissern Sie sich, daß alle groben Fehler vor der Ausgleichung entfernt werden.

Diese Meldung kann ebenfalls erzeugt werden, wenn es Winkel in der Ausgleichung gibt, deren beobachtete Strecken kürzer sind als 25 Meter. Stellen Sie den Wert für die Option Iterationen beenden bei in der Gruppe Restwert-Toleranzen so ein, daß die Koordinatenänderungen berücksichtigt werden (1.0 e-3 m).

Ausgleichung gescheitert − Horizontale oder vertikale Koordinate instabil

Diese Meldung wird erzeugt, wenn ein mathematischer Fehler bei den Ausgleichungsberechnungen auftritt. Die Meldung gibt an, ob das Problem durch eine horizontale oder vertikale Koordinate verursacht wurde und enthält den  Punkt, der den Fehler verursacht hat. Überprüfen Sie das Netz, identifizieren Sie den problematischen Punkt und überprüfen Sie Ihre Daten.

Ausgleichung gescheitert − Instabile Transformation

Diese Meldung wird erzeugt, wenn ein mathematischer Fehler bei den Ausgleichungsberechnungen auftritt.

Die Meldung gibt an, welcher Parameter das Problem verursacht hat und enthält den Namen der Transformationsgruppe.

Diese Meldung wird angezeigt, wenn der GPS-Teil eines Netzes nicht vollständig in den terrestrischen Teil integriert ist. Dies kann z. B. in einem kombinierten Netz mit GPS- und terrestrischen Beobachtungen der Fall sein, wenn der terrestrische Teil des Netzes aus zwei oder mehreren Segmenten besteht, die untereinander nicht verbunden sind. Weitere Informationen finden Sie unter dem Thema Unterschiedliche Beobachtungstypen in einer Netzausgleichung kombinieren.

Vergewissern Sie sich, daß genügend Beobachtungen existieren, die eine Verbindung zwischen den GPS- und terrestrischen Beobachtungen herstellen, und/oder deaktivieren Sie die GPS-Transformationen. Alternativ dazu können Sie das Problem lösen, indem Sie die Koordinaten für einen Punkt festhalten, der direkt mit dem GPS-Teil des Netzes verbunden ist.


Dialogfeld Netzausgleichungsstile - Überblick
;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;• ;;;;;;;;;;;;;;;;;;;?;;;?;;;• ;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;?;;;;;O;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;Figure ;Figure ;Figure ;	Figure 	;
Figure 	;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;Table ;Table ;Table ;Table ;	Table ;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;Note – ;;;;;;;;;;;;;;;;;;;• ;;;;;;;;;;;;;;;;;;;;;?;;;Tip – ;;;;;;;;;;;;;;;;;;;*;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;• ;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;?;;;?;;;?;;;;;;;;;;;;;;;;;;;*;;;;;;;;;;;;;;;;;;; [image]    Dialogfeld Netzausgleichungsstile − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, um Ausgleichungsstile auszuwählen, anzusehen, zu erstellen, zu kopieren, umzubenennen und zu löschen. Der aktuelle Stil wird als aktiver Stil bezeichnet. Die für den aktiven Stil festgelegten Einstellungen werden immer auf die nachfolgende Ausgleichung angewendet.

Sie können eine Stilbibliothek erstellen, um unterschiedliche Ausgleichungen durchzuführen und diese Stile in mehreren Projekten zu verwenden.

So greifen Sie auf das Dialogfeld  Netzausgleichungsstile zu:

  Wählen Sie Ausgleichung / Ausgleichungsstile.

Folgende Optionen sind verfügbar:

Aktiver Stil

Verwenden Sie dieses Feld, um den aktuellen aktiven Stil für die Netzausgleichung festzulegen. Neue aktive Stile werden aus der Stil-Liste gewählt und erscheinen in diesem Feld. Dieses Feld ist ein reines Anzeigefeld und kann nicht bearbeitet werden.

Stil-Liste

Wählen Sie den aktiven Stil aus der Liste. Wenn ein Stil aktiv ist, kann eine der Schaltflächen auf der rechten Seite des Dialogfelds gewählt werden, um den Stil zu bearbeiten, zu kopieren, umzubenennen oder zu löschen.

Wenn Sie einen Stil wählen und auf OK klicken, wird der Stil zum aktiven Stil der Ausgleichung.

Die Trimble Geomatics Office Software enthält mehrere vordefinierte Ausgleichungsstile. Sie können diese kopieren und als Grundlage für die Erstellung neuer Stile verwenden oder Sie können Ihre eigenen Stile erstellen. Jeder Ausgleichungsstil kann bearbeitet werden.

Die in der Liste angezeigten Stile werden nicht in dem Projekt selbst, sondern in der Windows-Registrierung gespeichert, wo sie für verschiedene Projekte genutzt werden können.

Bearbeiten

Klicken Sie auf diese Schaltfläche, um Stile anzusehen oder zu bearbeiten. Wenn Sie diese Schaltfläche wählen, wird der aus der Liste gewählte Stil zum aktiven Stil, und das Dialogfeld Ausgleichungsstil bearbeiten, das Optionen zur Bearbeitung des Ausgleichungsstils enthält, erscheint.

Neu

Klicken Sie auf diese Schaltfläche, um einen neuen Ausgleichungsstil zu erstellen. Das Dialogfeld Neuer Stil erscheint.

Wenn dem Stil eine Bezeichnung zugewiesen wird, wird er zum aktiven Stil. Das Dialogfeld Ausgleichungsstil bearbeiten, das Optionen zur Bearbeitung des Ausgleichungsstils enthält, erscheint. Weitere Informationen finden Sie unter Stile erstellen.

HINWEIS: Der Stil ‘95% Vertrauensgrenzen’ ist der voreingestellte Stil für die Erzeugung neuer Stile.

Kopieren

Klicken Sie auf diese Schaltfläche, um den aktiven Stil zu kopieren und ihn als Grundlage für die Erstellung eines neuen Ausgleichungsstils zu verwenden. Wenn Sie diese Schaltfläche wählen, wird die Kopie des Stils zum aktiven Stil und das Dialogfeld Stil kopieren erscheint.

Wenn dem Stil eine Bezeichnung zugewiesen wird, erscheint das Dialogfeld Ausgleichungsstil bearbeiten, das Optionen für die Bearbeitung des Ausgleichungsstils enthält. Weitere Informationen finden Sie unter Stile kopieren.

Umbenennen

Klicken Sie auf diese Schaltfläche, um das Dialogfeld Stil umbenennen anzuzeigen. Verwenden Sie das Feld Name, um den neuen Stilnamen einzugeben. Wenn Sie auf OK klicken, wird der Stilname in der Windows-Registrierung umbenannt, der Stil wird zum aktiven Stil, und der neue Name erscheint im Feld Aktiver Stil. Weitere Informationen finden Sie unter Stile umbenennen.

Löschen

Klicken Sie auf diese Schaltfläche, um den aktiven Stil zu löschen. Gelöschte Stile werden permanent aus der Windows-Registrierung entfernt und sind nicht länger verfügbar. Weitere Informationen finden Sie unter Stile löschen.


Dialogfeld Ausgleichungsstil bearbeiten - Überblick
   Dialogfeld Ausgleichungsstil bearbeiten − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, wenn Sie den aktiven Ausgleichungsstil ansehen oder bearbeiten möchten.

  So greifen Sie auf das Dialogfeld Ausgleichungsstil bearbeiten zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten.

Das Dialogfeld Ausgleichungsstil bearbeiten erscheint. Der gewählte Stil wird in der Titelleiste des Dialogfelds angezeigt.

Folgende Register sind verfügbar:

Allgemein

Wählen Sie dieses Register, um die Restwert-Toleranzen, Sigma-Skalare und die allgemeinen Eigenschaften für einen Ausgleichungsstil anzusehen oder zu bearbeiten. Weitere Informationen finden Sie unter Allgemein.

Kovarianz-Anzeige

Wählen Sie dieses Register, um die Anzeigeoptionen für die zwei- und dreidimensionale Kovarianz des Ausgleichungsstils anzusehen oder zu bearbeiten. Weitere Informationen finden Sie unter Kovarianz-Anzeige.

Terrestrische Steuerungen

Wählen Sie dieses Register, um die Einstellungen für mittlere Fehler anzusehen oder zu bearbeiten und um festzulegen, welcher Netzausgleichungstyp durchgeführt werden soll (horizontal, vertikal oder beide). Weitere Informationen finden Sie unter Terrestrische Steuerungen.

Standpunktfehler

Wählen Sie dieses Register, um bekannte Fehler in der Antennenhöhe, der Antennenzentrierung (Zentrieren), der Gerätehöhe und der Gerätezentrierung anzusehen oder zu bearbeiten. Diese Definitionen werden generell auf alle Beobachtungen angewendet, um Fehler, die bei der Ausgleichungsberechnung entstehen, zu kompensieren. Weitere Informationen finden Sie unter Standpunktfehler.


Dialogfeld Ausgleichungsstil bearbeiten - Register Allgemein
    Dialogfeld Ausgleichungsstil bearbeiten − Register Allgemein

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Register, um die Restwert-Toleranzen, Sigma-Skalare und die allgemeinen Eigenschaften eines Ausgleichungsstils zu definieren.

So greifen Sie auf das Register Allgemein im Dialogfeld Ausgleichungsstil bearbeiten zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile, um das Dialogfeld Ausgleichungsstil bearbeiten aufzurufen.

Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

Der gewählte Stil wird in der Titelleiste des Dialogfelds angezeigt.

4.	Wählen Sie das Register Allgemein.

Folgende Optionen sind verfügbar:

Reduziertes Spaltenprofil verwenden

Wählen Sie dieses Kontrollkästchen, um den bei einer Netzausgleichung verwendeten Arbeitsspeicher des Computers zu reduzieren. Bei großen Netzen verkürzt sich dadurch die Zeit, die zur Erstellung einer Netzausgleichung erforderlich ist.

HINWEIS: Diese Option verwendet eine vom U.S. National Geodetic Survey (NGS) entwickelte Kombination von Algorithmen.

Die Verwendung dieser Option hat keinen Einfluß auf die Ausgleichungsresultate; sie bewirkt nur, daß die Kovarianzwerte zwischen Punkten, die nicht durch Beobachtungen verbunden sind, ausgeblendet werden.

Wenn Sie diese Option verwenden, müssen Sie mindestens einen horizontalen und einen vertikalen Festpunkt festhalten

Wenn Sie eine freie Ausgleichung (eine oder keine festgehaltenen Koordinaten) durchführen, können Sie die Option Reduziertes Spaltenprofil verwenden nicht benutzen. Bei freien Ausgleichungen wird die Änderung im Register Allgemein des Dialogfelds Aussgleichungsstile ignoriert und die Augleichung wird ohne die Verwendung des reduzierten Spaltenprofils durchgeführt.

Kovarianzwerte auf beobachtete Linien beschränken

Wählen Sie dieses Kontrollkästchen, um die Anzeige der Kovarianzwerte auf beobachtete Linien zu beschränken. Die Verwendung dieser Option hat keinen Einfluß auf die endgültigen Ausgleichungsresultate; sie bewirkt nur, daß die Kovarianzwerte zwischen Punkten, die nicht durch Beobachtungen verbunden sind, ausgeblendet werden.

Wenn das Kontrollkästchen nicht aktiviert ist, werden die Kovarianzwerte für alle Punktpaar-Permutationen im Netz berechnet. Bei großen Netzen kann die Liste der Kovarianzwerte im Ausgleichungsbericht sehr umfangreich sein.

Korrelationen für Geoid-Modell berechnen

Wenn Sie Geoid-Beobachtungen in einer  Ausgleichung verwenden, sollten die vertikalen Koordinaten (ellipsoidische und orthometrische Höhe) weiterhin festgehalten werden, so daß eine überbestimmte Lösung möglich ist und ein Geoid-Restwert für die bedingten Punkte berechnet werden kann.

Wenn das Kontrollkästchen Korrelationen für Geoid-Modell berechnen gewählt ist, werden Geoid-Restwerte für Punkte ohne bedingte vertikale Koordinaten berechnet. Dabei werden die Geoid-Modell Korrelationen zwischen den Punkten verwendet.

Wenn das Kontrollkästchen deaktiviert ist, werden nur Restwerte zwischen Punkten mit festgehaltenen ellipsoidischen und orthometrischen Höhen berechnet.

Restwert-Toleranzen

Verwenden Sie diese Optionen, um die Restwert-Toleranzen, die bei der Netzausgleichung verwendet werden, zu steuern. Weitere Informationen finden Sie unter Restwert-Toleranzen.

Sigma-Skalare

Wählen Sie eine Option aus der Liste, um die univariaten und bivariaten Sigma-Skalare festzulegen. Weitere Informationen finden Sie unter Sigma-Skalare.

Maximale Iterationen

Geben Sie die maximale Anzahl der Iterationen, die für die Konvergenz des Netzes bei der Ausgleichung zulässig sind, in dieses Feld ein. Das Feld Maximale Iterationen ist auf einen Wert von 10 voreingestellt.


    Restwert-Toleranzen

Weitere Informationen

 Siehe auch

Überblick

Diese Optionen steuern die bei der Netzausgleichung verwendeten Restwert-Toleranzen. Die Netzausgleichung ist ein iterativer Prozeß. Jede Ausgleichungsiteration wird auf der Grundlage dieser Restwert-Toleranzen auf Konvergenz geprüft.

Iterationen beenden bei

Geben Sie die Restwert-Toleranz in dieses Feld ein. Der eingegebene Wert bestimmt, ob Ausgleichungsiterationen fortgeführt oder beendet werden sollen.

Nach jeder Ausgleichungsiteration wird ein Beobachtungsrestwert mit Hilfe von zwei unterschiedlichen Software-Routinen berechnet. Die Differenz der beiden Berechnungen wird mit der im Feld Iterationen beenden bei eingegebenen Toleranz verglichen. Ausgehend von diesem Vergleich, wird einer der nachfolgenden Vorgänge durchgeführt:

  Wenn die Differenz zwischen den berechneten Beobachtungsrestwerten geringer ist, als die im Feld Iterationen beenden bei festgelegte Toleranz, werden die Ausgleichungsiterationen beendet. Der Netzausgleichungsbericht enthält die Meldung Erfolgreiche Ausgleichung in ## Iteration(en), wobei ## die Anzahl der Iterationen bezeichnet, die für die Konvergenz des Netzes erforderlich waren.

  Wenn die Differenz zwischen den berechneten Beobachtungsrestwerten größer ist, als die im Feld Iterationen beenden bei festgelegte Toleranz, werden die Ausgleichungsiterationen fortgeführt. Ist der im Feld Maximale Iterationen festgelegte Wert erreicht, kommt der Endgültige Konvergenz-Grenzwert zur Anwendung (siehe unten).

Endgültiger Konvergenz-Grenzwert

Geben Sie den Konvergenz-Grenzwert für die letzte Netzausgleichungsiteration in dieses Feld ein. Wenn die letzte durchgeführte Iteration die festgelegte Toleranz im Feld Iterationen beenden bei nicht überschreitet, benutzt die Software diesen Wert, um zu bestimmen, ob die Netzausgleichung erfolgreich durchgeführt wurde.

Wenn die berechnete Differenz der Beobachtungsrestwerte für die letzte Ausgleichungsiteration größer ist, als die Toleranz im Feld Iterationen beenden bei, wird der Restwert mit dem endgültigen Konvergenz-Grenzwert verglichen, und einer der nachfolgenden Vorgänge wird durchgeführt:

  Wenn die Differenz zwischen den berechneten Beobachtungsrestwerten geringer ist, als der endgültige Konvergenz-Grenzwert, ist die Ausgleichung erfolgreich. Die  Meldung Erfolgreiche Ausgleichung in ## Iteration(en) (endgültiger Konvergenz-Grenzwert verwendet) wird angezeigt, wobei ## die Anzahl der Iterationen bezeichnet, die für die Konvergenz des Netzes erforderlich waren.

 Wenn der Beobachtungsrestwert größer ist, als der endgültige Konvergenz-Grenzwert, ist die Ausgleichung gescheitert und ein Dialogfeld mit der Warnmeldung  Ausgleichung gescheitert. Keine Konvergenz erscheint.

Diese Meldungen sind ebenfalls im Netzausgleichungsbericht enthalten.

Der im Feld Maximale Iterationen eingegebene Wert legt fest, wann die letzte Iteration durchgeführt wird. Seien Sie vorsichtig, wenn Sie Änderungen an der Anzahl der Iterationen und an den Toleranzen in den Feldern Iterationen beenden bei und Endgültiger Konvergenz-Grenzwert vornehmen.


    Sigma-Skalare

Weitere Informationen

 Siehe auch

Überblick

Mit diesen Optionen werden die univariaten und bivariaten Sigma-Skalare festgelegt. Univariate Sigma-Skalare werden auf alle eindimensional fortgepflanzten Fehler in Beobachtungen, Koordinatenkomponenten und horizontalen Genauigkeiten angewandt. Bivariate Sigma-Skalare werden auf alle zweidimensionalen Fehlerellipsen angewandt.

Gemäß Voreinstellung werden alle fortgepflanzten Fehler als 2-Sigma Standardfehler mit einem Vertrauensgrad von 95% für univariate und bivariate Sigma-Skalare angezeigt.

Folgende Optionen sind verfügbar:

Univariat

Verwenden Sie diese Liste, um den univariaten Sigma-Skalar auszuwählen, der auf alle fortgepflanzten Fehler in Beobachtungen, Koordinatenkomponenten und horizontalen Genauigkeiten angewendet werden soll. Diese Fehler sind eindimensionale Fehler.

Für die Methoden US, Bomford und Spärisch sind folgende Optionen sind verfügbar:

  1,000 (68%)

  1,646 (90%)

  1,960 (95%)

  2,575 (99%)

Bivariat

Verwenden Sie diese Liste, um den bivariaten Skalar auszuwählen, der auf alle Fehlerellipsen angewendet werden soll. Die Fehlerellipsen sind graphische Darstellungen zweidimensionaler Fehler.

Folgende Optionen sind verfügbar:

  1,000 (39%)

  2,147 (68%)

  2,447 (95%)

  3,035 (99%)


Dialogfeld Ausgleichungsstil bearbeiten - Register Kovarianz-Anzeige
    Dialogfeld Ausgleichungsstil bearbeiten − Register Kovarianz-Anzeige

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Register, um die Anzeigeoptionen für die zwei- und dreidimensionale Kovarianz des Netzausgleichungsstils festzulegen.

So greifen Sie auf das Register Kovarianz-Anzeige im Dialogfeld Ausgleichungsstil bearbeiten zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile, um das Dialogfeld Netzausgleichungsstile aufzurufen. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

Der gewählte Stil wird in der Titelleiste des Dialogfelds angezeigt.

4.	Wählen Sie das Register Kovarianz-Anzeige. Die Optionen für die Kovarianz-Anzeige werden angezeigt.

Folgende Optionen sind verfügbar:

Horizontal

Verwenden Sie diese Optionen, um die Anzeigeoptionen für die zweidimensionale Kovarianz des Netzausgleichungsstils festzulegen. Weitere Informationen finden Sie unter Horizontal.

Dreidimensional

Verwenden Sie diese Optionen, um die Anzeigeoptionen für die dreidimensionale Kovarianz des Netzausgleichungsstils festzulegen. Weitere Informationen finden Sie unter Dreidimensional.


    Horizontal (Kovarianz-Anzeige)

Weitere Informationen

 Siehe auch

Überblick

Die folgenden Optionen legen die Anzeigeoptionen für die zweidimensionale Kovarianz der Ausgleichung fest:

Genauigkeit angeben als

Verwenden Sie diese Liste, um die Methode festzulegen, mit der horizontale (2D) Genauigkeiten (P) als proportionale Fehler angegeben werden sollen. Bei horizontalen Genauigkeiten wird die Strecke als horizontale Strecke zwischen Punkten angegeben.

Wählen Sie eine der folgenden Optionen:

  PPM – Wählen Sie diese Option, um die horizontale Genauigkeit in Einheiten von X Teilen pro Million anzugeben, wobei X = Strecke × P × 1.0e-06) ist.

  Verhältnis – Wählen Sie diese Option, um die horizontale Genauigkeit als Einheiten von 1 geteilt durch X anzugeben, (wobei X = Strecke ÷ P) ist.

  Keine – Wählen Sie diese Option, um die Anzeige der horizontalen Genauigkeit zu deaktivieren.

HINWEIS: Die Genauigkeit wird unter Verwendung folgender Formel berechnet:

(E x S)2 = C2 + P2

wobei:

E der fortgepflanzte lineare Fehler ist

S der Skalar des fortgepflanzten linearen Fehlers ist

C der Fehler im Absolutglied ist

P die Genauigkeit ist

Fortgepflanzter linearer Fehler

Verwenden Sie diese Liste, um den horizontal (zweidimensional) fortgepflanzten linearen Fehler für den Netzausgleichungsstil festzulegen. Der berechnete fortgepflanzte lineare Fehler liegt bei 1-Sigma, unabhängig von den Werten, die für die univariaten und bivariaten Sigma-Skalare angegeben wurden.

Wählen Sie eine der folgenden Optionen:

  US – Wählen Sie diese Option, um den mittleren Fehler der ausgeglichenen horizontalen Strecke (2D) oder Schrägstrecke (3D) zu verwenden.

  Kanadisch – Wählen Sie diese Option, um die größte große Halbachse des relativen 2D- oder 3D-Fehlerellipse zu verwenden.

  Bomford – Wählen Sie diese Option, um die Quadratwurzel der Summe der relativen 2D- oder 3D-Fehlervarianzen zu verwenden.

  Sphärisch – Wählen Sie diese Option, um das Mittel der relativen 2D- oder 3D-Standardfehler zu verwenden.

Absolutglied

Das Absolutglied muß in den Projekteinheiten angegeben werden, die im Dialogfeld Projekteigenschaften festgelegt wurden. Der Wert muß in einem Bereich von 0,0 m bis 0,1 m liegen.

Skalar bei linearem Fehler

Verwenden Sie diese Liste, um den horizontalen (zweidimensionalen) Skalar für die Skalierungsgenauigkeit auf den gewünschten Vertrauensgrad einzustellen. Für die Skalierung relativer Kovarianzmatrizen wird das Quadrat des fortgepflanzten linearen Fehlers verwendet.

Wählen Sie für die Methoden US, Bomford und Sphärisch eine der folgenden Optionen:

  1,000 (68%)

  1,646 (90%)

  1,969 (95%)

  2,575 (99%)

Wählen Sie für die Methode Kanadisch eine der folgenden Optionen:

  1,000 (39%)

  2,147 (90%)

  2,447 (95%)

  3,035 (99%)


    Dreidimensional (Kovarianz-Anzeige)

Weitere Informationen

 Siehe auch

Überblick

Die folgenden Optionen legen die Anzeige der dreidimensionalen Kovarianz für die Ausgleichung fest:

Genauigkeit angeben als

Wählen Sie die Methode, mit der dreidimensionale (3D) Genauigkeiten (P) als proportionale Fehler angegeben werden sollen. Bei der dreidimensionalen Genauigkeit wird die Schrägstrecke als Strecke zwischen Punkten angegeben.

Wählen Sie eine der folgenden Optionen:

  PPM – Wählen Sie diese Option, um die horizontale Genauigkeit in Einheiten von X Teilen pro Million anzugeben, (wobei X = Strecke × P × 1.0e-06) ist.

  Verhältnis – Wählen Sie diese Option, um die horizontale Genauigkeit als Einheiten von 1 geteilt durch X anzugeben, (wobei X = Strecke ÷ P) ist.

  Keine – Wählen Sie diese Option, um die Anzeige der horizontalen Genauigkeit zu deaktivieren.

HINWEIS: Die Genauigkeit wird unter Verwendung folgender Formel berechnet:

(E x S)2 = C2 + P2

wobei:

E der fortgepflanzte lineare Fehler ist

S der Skalar des fortgepflanzten linearen Fehlers ist

C der Fehler im Absolutglied ist

P die Genauigkeit ist

Fortgepflanzter linearer Fehler

Verwenden Sie diese Liste, um den dreidimensional fortgepflanzten linearen Fehler für den Netzausgleichungsstil festzulegen.

Der berechnete fortgepflanzte lineare Fehler liegt bei 1-Sigma, unabhängig von den Werten, die für die univariaten und bivariaten Sigma-Skalare angegeben wurden.

Wählen Sie eine der folgenden Optionen:

  US – Wählen Sie diese Option, um das Mittel der ausgeglichenen horizontalen Strecke  (2D) oder Schrägstrecke (3D) zu verwenden.

  Kanadisch – Wählen Sie diese Option, um die größte große Halbachse der relativen 2D- oder 3D-Fehlerellipse zu verwenden.

  Bomford – Wählen Sie diese Option, um die Quadratwurzel der Summe der relativen 2D- oder 3D-Fehlervarianzen zu verwenden.

  Sphärisch – Wählen Sie diese Option, um das Mittel der relativen 2D-oder 3D-Standardfehler zu verwenden.

Absolutglied

Das Absolutglied muß in den Projekteinheiten angegeben werden, die im Dialogfeld Projekteigenschaften festgelegten wurden. Der Wert muß in einem Bereich von 0,0 m bis 0,1 m liegen.

Skalar bei linearem Fehler

Verwenden Sie diese Liste, um den dreidimensionalen Skalar für die Skalierungsgenauigkeit auf den gewünschten Vertrauensgrad festzulegen. Für die Skalierung relativer Kovarianzmatrizen wird der fortgepflanzte lineare Fehler quadriert.

Wählen Sie für die Methoden US, Bomford und Sphärisch eine der folgenden Optionen:

  1,000 (68%)

  1,646 (90%)

  1,969 (95%)

  2,575 (99%)

Wählen Sie für die Methode Kanadisch eine der folgenden Optionen:

  1,000 (39%)

  2,147 (90%)

  2,447 (95%)

  3,035 (99%)

Höhenfehler verwenden, falls verfügbar

Verwenden Sie dieses Kontrollkästchen, um festzulegen, ob verfügbare orthometrische Höhenfehler oder Fehler der Ellipsoid-Höhe für die Berechnung der dreidimensionalen (3D) Genauigkeit verwendet werden sollen.

Aktivieren Sie dieses Kontrollkästchen, um die dreidimensionale Genauigkeit unter Verwendung orthometrischer Höhenfehler zu berechnen. Deaktivieren Sie das Kontrollkästchen, um bei der Berechnung der dreidimensionalen Genauigkeit Fehler der Ellipsoid-Höhe zu verwenden.

Wenn das Kontrollkästchen aktiviert ist, werden orthometrische Höhenfehler nur dann auf die Berechnung angewendet, wenn die Geoid-Beobachtungen für die Berechnung orthometrischer Höhen geladen sind. Gemäß Voreinstellung ist dieses Kontrollkästchen aktiviert. Lassen Sie das Kontrollkästchen aktiviert, wenn Sie sicher sind, daß die Qualität der vertikalen Festpunkte und des gewählten Geoid-Modells ausreichend ist.

Wenn unter Projekteigenschaften kein Geoid-Modell gewählt wurde, werden ellipsoidische Höhenfehler verwendet, und der orthometrische Höhenfehler wird bei Berechnung der dreidimensionalen Genauigkeit ignoriert.


Dialogfeld Ausgleichungsstil bearbeiten - Register Standpunktfehler
    Dialogfeld Ausgleichungsstil bearbeiten − Register Standpunktfehler

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie diesen Stil, um bekannte Fehler in der Antennenhöhe, der Antennenzentrierung, der Instrumentenhöhe und der Instrumentenzentrierung (Zentrieren) zu definieren. Diese Definitionen werden generell auf alle Beobachtungen angewendet, um Fehler bei der Berechnung von Netzausgleichungen zu kompensieren

So greifen Sie auf das Register Standpunktfehler im Dialogfeld Ausgleichungsstil bearbeiten zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile, um das Dialogfeld Netzausgleichungsstile anzuzeigen. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

Der gewählte Stil wird in der Titelleiste des Dialogfelds angezeigt.

4.	Wählen Sie das Register Standpunktfehler.

Folgende Optionen sind in der Gruppe GPS verfügbar:

Fehler in Antennenhöhe

Verwenden Sie dieses Feld, um den geschätzten Fehler in der Antennenhöhe festzulegen. Der geschätzte Fehler wird bei der Berechnung der Netzausgleichung generell auf alle GPS-Beobachtungen angewendet.

Die Fehlerschätzung ist abhängig vom verwendeten Meßwerkzeug und der Möglichkeit, diese Messung abzulesen. Wenn ein Stahlmaßband zur Messung der Antennenhöhe verwendet wird, sind die zulässigen Fehlerschätzungen etwas höher als Fehlerschätzungen für einen Höhenmeßstab. Ein Höhenmeßstab ist, im Gegensatz zum Stahlmaßband, relativ unflexibel.

Geschätzte Fehler in der Antennenhöhe liegen in der Regel in einem Bereich von 0,000 bis 0,004 mm (0.000 bis 0.013 Vermessungs-Fuß). Die Voreinstellung beträgt 0,000 m (0.000 Vermessungs-Fuß).

Zentrierfehler

Verwenden Sie dieses Feld, um den geschätzten Fehler beim Zentrieren und bei der Nivellierung einer Antenne über einem Vermessungspunkt anzugeben.

Der geschätzte Fehler wird bei der Berechnung der Netzausgleichung generell auf alle GPS-Beobachtungen angewendet. Die Fehlerschätzung hängt auch davon ab, wie gut ein Dreifuß gewartet und über dem Vermessungspunkt zentriert wird.

Zentrierfehler liegen in der Regel in einem Bereich von 0,000 bis 0,002 m (0.002 bis 0.007 Vermessungs-Fuß). Die Voreinstellung beträgt 0,000 m (0.000 Vermessungs-Fuß).

Folgende Optionen sind in der Gruppe Terrestrische verfügbar:

Fehler in Instrumentenhöhe

Verwenden Sie dieses Feld, um den geschätzten Fehler in der Instrumentenhöhe oder Zielhöhe zu definieren. Der geschätzte Fehler wird bei der Berechnung der Netzausgleichung generell auf alle terrestrischen Beobachtungen angewendet.

Der geschätzte Fehler ist vom Typ des Vermessungsgeräts abhängig, und davon, wie gut das Instrument abgelesen werden kann. Fehler in der Instrumentenhöhe liegen in der Regel in einem Bereich von 0,000 bis 0,004 mm (0.000 bis 0.013 Vermessungs-Fuß). Die Voreinstellung beträgt 0,000 m (0.000 Vermessungs-Fuß).

Zentrierfehler

Verwenden Sie dieses Feld, um den geschätzten Fehler beim Zentrieren und bei der Nivellierung eines Instruments oder Zielpunkts über einem Vermessungspunkt anzugeben.

Der geschätzte Fehler wird bei der Berechnung der Netzausgleichung generell auf alle terrestrischen Beobachtungen angewendet. Die Fehlerschätzung hängt auch davon ab, wie gut ein Dreifuß gewartet und über dem Vermessungspunkt zentriert wird.

Zentrierfehler liegen in der Regel in einem Bereich von 0,000 bis 0,002 m (0.002 bis 0.007 Vermessungs-Fuß). Die Voreinstellung beträgt 0,000 m (0.000 Vermessungs-Fuß).


    Dialogfeld Neuer Stil

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, um einen neuen Netzausgleichungsstil zu erstellen.

So greifen Sie auf das Dialogfeld Neuer Stil zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile, um das Dialogfeld Netzausgleichungsstile anzuzeigen.

Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Klicken Sie auf Neu. Der neue Stil wird zum aktiven Stil und das Dialogfeld Neuer Stil erscheint.

Folgende Option ist verfügbar:

Name

Geben Sie den Namen des neuen Netzausgleichungsstils in dieses Feld ein. Der Name kann aus bis zu 255 Zeichen bestehen. Kürzere Namen sind in der Liste der Ausgleichungsstile jedoch einfacher aufzufinden. Klicken Sie auf OK, wenn Sie einen Namen eingegeben haben, um das Dialogfeld Ausgleichungsstil bearbeiten anzuzeigen. Sie können dieses Dialogfeld verwenden, um die Steuerungen des Ausgleichungsstils zu bearbeiten.


    Dialogfeld Stil kopieren

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, um einen neuen Netzausgleichungsstil auf der Grundlage eines anderen kopierten Netzausgleichungsstils zu erstellen.

So greifen Sie auf das Dialogfeld Stil kopieren zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile, um das Dialogfeld Netzausgleichungsstile anzuzeigen. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen bestehenden Stil, den Sie kopieren möchten, aus der Stil-Liste.

3.	Klicken Sie auf Kopieren.

Der kopierte Stil wird zum aktiven Stil, und das Dialogfeld Stil kopieren erscheint.

Folgende Option ist verfügbar:

Name

Geben Sie den Namen des neuen Netzausgleichungsstils in dieses Feld ein. Eine Kopie des aus der Stil-Liste ausgewählten Stils wird unter dem eingegebenen Namen erstellt. Der Name kann aus bis zu 255 Zeichen bestehen. Kürzere Namen sind in der Liste der Ausgleichungsstile jedoch einfacher aufzufinden. Klicken Sie auf OK, wenn Sie einen Namen eingegeben haben, um das Dialogfeld Ausgleichungsstil bearbeiten anzuzeigen. Sie können dieses Dialogfeld verwenden, um die Steuerungen des Ausgleichungsstils zu bearbeiten.


    Dialogfeld Stil umbenennen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, um einen Netzausgleichungsstil umzubenennen.

So greifen Sie auf das Dialogfeld Stil umbenennen zu:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile, um das Dialogfeld Netzausgleichungsstile aufzurufen. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie den umzubenennenden Stil aus der Stil-Liste.

3.	Klicken Sie auf Umbenennen.

Das Dialogfeld Stil umbenennen erscheint.

Folgende Option ist verfügbar:

Name

Geben Sie den neuen Namen für den Netzausgleichungsstil in dieses Feld ein. Der Name kann aus bis zu 255 Zeichen bestehen. Kürzere Namen sind in der Liste der Ausgleichungsstile jedoch einfacher aufzufinden.


Dialogfeld Ausgleichungsstil bearbeiten  - Register Terrestrische Steuerungen
Dialogfeld Ausgleichungsstil bearbeiten  − Register Terrestrische Steuerungen

Weitere Informationen

 Dialogfeld

Überblick

Verwenden Sie dieses Dialogfeld, um die terrestrischen Fehlerschätzungen und Steuerungen zu definieren. Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Messung	Die verfügbaren terrestrischen Messungen. Diese beinhalten:   Horizontale Winkel   Schrägstrecken   Vertikale Winkel   Höhenunterschiede   Ablesung Nivellierlatte   Geoidabstände   Azimute
Voreingest. mittl. Fehler	Die mittleren Fehler, die verwendet werden, wenn keine mittleren Fehler für die Beobachtung vorhanden sind.
Absoluter min. mittl. Fehler	Die absoluten minimalen mittleren Fehler. Diese Fehler werden verwendet, wenn die Fehler größer sind als die vorhandenen mittleren Fehler.
Proportionaler min. mittl. Fehler	Die proportionalen minimalen mittleren Fehler. Diese Fehler werden verwendet, wenn die Summe der absoluten Fehlerkomponente und der proportionalen Fehlerkomponente größer ist, als die vorhandenen mittleren Fehler. HINWEIS: Proportionale Fehler sind nur für Schrägstrecken verfügbar.


Beobachtungen zu Transformationsgruppen hinzufügen
Wählen Sie eines der folgenden Kontrollkästchen, um den Ausgleichungstyp für die terrestrischen Beobachtungen festzulegen:

  Vertikale Ausgleichung durchführen

  Horizontale Ausgleichung durchführen

;.;;.;;.;;.;;.;;.;;.;;.;;;;.;;.;;.;;.;;.;;.;;.;;.;;;*;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;Note – ;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;?;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;• ;;;;;;;;;;;;;;;;;;;;;;;	;	;

;
;
;;?;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;	;	;

;
;
;;;;?;;;;;;;Figure ;Figure ;Figure ;	Figure 	;
Figure 	;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;• ;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;?;;;?;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;-;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;• ;;;;;;;;;;;;;;;;;;;?;;;?;;;;;• ;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;;?;;;;;;;?;;;;;O;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;Figure ;Figure ;Figure ;	Figure 	;
Figure 	;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;;;Table ;Table ;Table ;Table ;	Table ;;;;;;;;;;;;?;;;?;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;Note – ;;;;;;;;;;;;;;;;;;;?;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;• ;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;Tip – ;;;;;;;;;;;;;;;;;;;*;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;?;;;• ;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;;.;;.;;.;;.;;.;;.;;.;;.;;;?;;;;;?;;;?;;;?;;;–;;;;;;;;;;;;;;;;;;;;.;;.;;.;;.;;.;;.;;.;;.;;;*;;;;;;;;;;;;;;;;;;;?;;;Beobachtungen zu Transformationsgruppen hinzufügen

 Überblick und weitere Informationen

Beobachtungen können jederzeit zu einer benutzerdefinierten Transformationsgruppe hinzugefügt werden. Sie können ebenfalls entfernt werden, wenn sie nicht länger benötigt werden.

TIP: Klicken Sie auf Filter, um das Dialogfeld Beobachtungsfilter anzuzeigen, das Filteroptionen für die Beobachtungstypen in der Liste Verfügbare Beobachtungen enthält.

TIP: Sie können Spalten auch an eine neue Position verschieben, ihre Größe ändern und sie in auf- oder absteigender Reihenfolge sortieren.

So fügen Sie Beobachtungen hinzu:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

HINWEIS: Sie können die voreingestellte Geoid-Transformationsgruppe nicht bearbeiten.

3.	Wählen Sie die Transformationsgruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint. In der Liste Gruppenbeobachtungen werden die in der Gruppe enthaltenen Beobachtungen angezeigt.

5.	Wählen Sie eine Beobachtung aus der Liste Verfügbare Beobachtungen.

6.	Klicken Sie auf Hinzufügen. Die Beobachtung wird zur Gruppenbeobachtungsliste hinzugefügt.

7.	Klicken Sie auf OK. Die Änderungen werden gespeichert.


Beobachtungen zu Varianzgruppen hinzufügen

Überblick und weitere Informationen
Beobachtungen können jederzeit zu einer Varianzgruppe hinzugefügt werden. Sie können ebenfalls entfernt werden, wenn sie nicht länger benötigt werden.

TIP: Klicken Sie auf Filter, um das Dialogfeld Beobachtungsfilter anzuzeigen, das Filteroptionen für die Beobachtungstypen in der Liste Verfügbare Beobachtungen enthält.

TIP: Sie können Spalten auch an eine neue Position verschieben, ihre Größe ändern und sie in auf- oder absteigender Reihenfolge sortieren.

So fügen Sie Beobachtungen hinzu:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

HINWEIS: Sie können die voreingestellte Geoid-Varianzgruppe nicht bearbeiten.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Varianzgruppe bearbeiten erscheint.

In der Liste Gruppenbeobachtungen werden die in der Gruppe enthaltenen Beobachtungen angezeigt. Die Liste Verfügbare Beobachtungen enthält alle aktivierten Projektbeobachtungen.

5.	Klicken Sie auf die Beobachtung in der Liste Verfügbare Beobachtungen, die Sie zu der Gruppe hinzufügen möchten.

6.	Klicken Sie auf Hinzufügen. Die Beobachtung wird zur Gruppenbeobachtungsliste hinzugefügt und aus der Liste Verfügbare Beobachtungen entfernt.

7.	Klicken Sie auf OK. Die Änderungen werden gespeichert.


Gewichtungsstrategien anwenden

 Überblick und weitere Informationen

Gewichtungsstrategien können auf die nächste Iteration einer Ausgleichung angewendet werden.

So wenden Sie Gewichtungsstrategien an:

1.	Wählen Sie Ausgleichung / Gewichtungsstrategien. Das Dialogfeld Gewichtungsstrategien erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Bearbeiten Sie die Gewichtungsstrategien.

4.	Klicken Sie auf Anwenden. Die neue Gewichtungsstrategie wird auf die nächste Ausgleichungsiteration angewendet.

5.	Klicken Sie auf OK. Das Dialogfeld wird geschlossen.


Die Werte für Transformationsparameter ändern

Überblick und weitere Informationen
ACHTUNG: Seien Sie beim Ändern der Wertefelder für Transformationsparameter besonders vorsichtig. Sie benötigen ein umfangreiches Wissen über die Netzausgleichungstheorie und über die Ausgleichung der kleinsten Quadrate, bevor Sie diese Änderungen vornehmen können.

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet. Diese Felder können für GPS und terrestrische Beobachtungen bearbeitet werden.

So ändern Sie einen Parameterwert:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

5.	Wählen Sie das Wertefeld für den gewünschten Transformationsparameter.

6.	Geben Sie den neuen Parameterwert ein.

Beachten Sie die folgenden Richtlinien:

  Winkelwerte werden als GGG.MMSSssss mit Vorzeichen eingegeben.

  Lineare Werte werden in Projekteinheiten mit Vorzeichen eingegeben.

Richtlinien zur Änderung von Wert und Status individueller Transformationsparameter finden Sie unter folgenden Themen:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

7.	Wählen Sie die Option Benutzerdefiniert aus der Statusliste. Weitere Informationen erhalten Sie unter einem der vorstehend genannten Themen.

8.	Wiederholen Sie die Schritte 1 bis 7, um, falls erforderlich, zusätzliche Werte für Transformationsparameter zu ändern. Es kann erforderlich sein, die Werte- und Statusfelder für verschiedene Parameter zu ändern, um die gewünschte Transformation zu erzeugen.

9.	Klicken Sie auf OK.

Die Änderungen werden auf die Transformationsgruppe angewendet.


Den Status festgehaltener Punkte aufheben, um Bedingungen für Koordinatenkomponenten zu entfernen

Die Statuseinstellungen in der Gruppe Festhalten, die verwendet werden, um Koordinatenkomponenten für individuelle Punkte in der Punktliste zu erzwingen (Zwangskoordinaten), kann nach Wunsch aufgehoben werden.

So haben Sie die Statuseinstellungen auf:

1.	Wählen Sie Ausgleichung / Punkte. Das Dialogfeld Punkte erscheint.

2.	Verwenden Sie die Bildlaufleiste, um zum gewünschten Punkt zu gelangen.

3.	Wählen Sie den Punkt.

4.	Deaktivieren Sie die Häkchen in der Optionsgruppe Festhalten für die entsprechenden Komponenten, um die Bedingungen für die Koordinatenkomponenten aufzuheben.

5.	Klicken Sie auf OK.

Die Änderungen werden auf das Projekt angewendet.


Netzausgleichungsstile kopieren

Bestehende Stile können kopiert werden, um neue Stile zu erstellen. Die Netzausgleichungseinstellungen des neuen Stils sind mit den Einstellungen des kopierten Stils identisch. Wenn ein Stil kopiert wurde, können die Ausgleichungseinstellungen nach Bedarf festgelegt werden.

So kopieren Sie einen Stil:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Klicken Sie auf Kopieren. Das Dialogfeld Stil kopieren erscheint.

3.	Geben Sie den Namen des neuen Stils in das Namensfeld ein.

4.	Klicken Sie auf OK. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

5.	Bearbeiten Sie die Stileinstellungen.

6.	Klicken Sie auf OK. Der neue Stil wird gespeichert.


Netzausgleichungsstile erstellen

Neue Ausgleichungsstile können auf zwei Arten erstellt werden. In diesem Abschnitt wird beschrieben, wie Sie neue Stile auf der Grundlage der Stileinstellung 95% Vertrauensgrenzen erstellen können. Ein zweites Thema behandelt, wie die Einstellungen eines bestehenden Stils in einen neuen Stil kopiert werden.

TIP: Der neue Stil kann bearbeitet werden, um die Feinabstimmung für die Ausgleichungseinstellungen nach Wunsch durchzuführen. Diese Einstellungen können, nachdem sie definiert wurden, auf neue Stile angewendet werden.

So erstellen Sie einen neuen Stil:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Klicken Sie auf Neu. Das Dialogfeld Neuer Stil erscheint.

3.	Geben Sie den Namen für den neuen Stil in das Namensfeld ein. Stilnamen können bis zu 255 Zeichen enthalten. Kürzere Dateinamen sind jedoch in der Liste der Stile einfacher aufzufinden.

4.	Klicken Sie auf OK. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

5.	Wählen Sie eines der folgenden Register:

  Allgemein

  Kovarianz-Anzeige

  Terrestrische Steuerungen

  Standpunktfehler

6.	Bearbeiten Sie die gewünschten Stileinstellungen.

7.	Klicken Sie auf OK, um den neuen Stil zu speichern.


Transformationsgruppen erstellen

 Überblick und weitere Informationen

Für eine Netzausgleichung können eine oder mehrere Transformationsgruppen erstellt werden. Sie werden nach der Erstellung zur Gruppenliste hinzugefügt.

HINWEIS: Es können nur neue Transformationsgruppen für GPS- oder terrestrische Beobachtungen erstellt werden. Die Erstellung mehrerer Geoid-Transformationsgruppen ist nicht zulässig.

So erstellen Sie eine neue Gruppe:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Klicken Sie auf Neu. Das Dialogfeld Neue Transformationsgruppe erscheint.

4.	Geben Sie den Gruppennamen in das Namensfeld ein.

5.	Klicken Sie auf OK. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

6.	Fügen Sie Beobachtungen aus der Liste Verfügbare Beobachtungen zur Liste Gruppenbeobachtungen hinzu.

7.	Definieren Sie Transformationsparameter für die Gruppen, oder legen Sie die Einstellungen für die Berechnung der Parameter fest.

TIP: Sie können die Liste filtern, um Beobachtungstypen zeitweise auszublenden, und die Liste übersichtlicher zu  gestalten. Kürzere Listen erleichtern das Auffinden von Beobachtungen.

So filtern Sie Beobachtungen:

1.	Klicken Sie auf Filter. Das Dialogfeld Beobachtungsfilter erscheint. Gemäß Voreinstellung sind alle Kontrollkästchen für Beobachtungstypen aktiviert, so daß alle Beobachtungen in der Liste Verfügbare Beobachtungen angezeigt werden.

2.	Deaktivieren Sie eine beliebige Kombination der Kontrollkästchen, um Beobachtungstypen auszublenden. Das Filtern beeinflußt nur die aktuelle Bearbeitungssitzung. Wenn Sie das Dialogfeld schließen, werden die Filtereinstellungen wieder auf die ursprünglichen Werte zurückgesetzt.

So fügen Sie eine Beobachtung hinzu:

1.	Wählen Sie die Beobachtung aus der Liste Verfügbare Beobachtungen. Die Schaltfläche Hinzufügen wird verfügbar.

HINWEIS:  Im Feld Transformationsgruppen werden Transformationsgruppen angezeigt, die bereits Beobachtungen enthalten. Verwenden Sie dieses Feld als Richtlinie, wenn Sie Beobachtungen hinzufügen. Individuelle Beobachtungen können (außer den Gruppen <GPS-Voreinstellung> und <Terr. Voreinstellung>) nur einer weiteren Transformationsgruppe zugeordnet werden. Sie können die in einer bestimmten Gruppe enthaltenen Beobachtungen jedoch in die aktive Gruppe übertragen, indem Sie sie auswählen und auf Hinzufügen klicken. Alle GPS-Beobachtungen bleiben auch weiterhin der Gruppe <GPS-Voreinstellung> zugeordnet, selbst wenn sie zu einer anderen Transformationsgruppe hinzugefügt wurden. Ebenso bleiben alle terrestrischen Beobachtungen ebenfalls in der Gruppe <Terr. Voreinstellung>, selbst wenn sie zu einer anderen Transformationsgruppe hinzugefügt werden.

2.	Klicken Sie auf Hinzufügen.

Die Beobachtung wird zur Liste Gruppenbeobachtungen hinzugefügt.

So entfernen Sie Beobachtungen:

1.	Wählen Sie die Beobachtung aus der Liste Gruppenbeobachtungen. Die Schaltfläche Entfernen wird verfügbar.

2.	Klicken Sie auf Entfernen.

Die Beobachtung wird aus der Gruppenbeobachtungsliste entfernt.

HINWEIS: Der Status der entfernten Beobachtungen ändert sich in der Liste Verfügbare Beobachtungen. Das Transformationsfeld für die Beobachtung wird gelöscht, so daß die Beobachtung zu anderen Transformationsgruppen hinzugefügt werden kann

HINWEIS: Es ist nicht möglich, Beobachtungen aus den Transformationsgruppen <GPS-Voreinstellung>, <Terr. Voreinstellung>  oder <Geoid-Voreinstellung> zu entfernen.

So definieren Sie Transformationsparameter:

ACHTUNG: Seien Sie beim Ändern der Werte- oder Statusfelder für Transformationsparameter besonders vorsichtig. Sie benötigen ein umfangreiches Wissen über die Netzausgleichungstheorie und über die Ausgleichung der kleinsten Quadrate, bevor Sie diese Änderungen vornehmen können. Eine Liste mit Publikationen zur Netzausgleichungstheorie und zu Ausgleichungen der kleinsten Quadrate finden Sie in der Bibliographie.

1.	Wählen Sie das Wertefeld für den gewünschten Parameter.

2.	Bearbeiten Sie das Feld, unter Verwendung der in einem nachfolgenden Themen enthaltenen Richtlinien:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet.

3.	Wählen Sie die entsprechende Option aus der Statusliste. Weitere Informationen finden Sie unter den vorstehend genannten Themen.

4.	Klicken Sie auf  OK, um die Änderungen zu speichern.


Varianzgruppen erstellen

Neue Varianzgruppen können jederzeit zwischen Ausgleichungen erstellt werden.

HINWEIS: Es können nur neue Varianzgruppen für GPS- oder terrestrische Beobachtungen erstellt werden. Die Erstellung mehrerer Geoid-Varianzgruppen ist nicht zulässig.

So erstellen Sie Varianzgruppen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Klicken Sie auf Neu, um eine neue Varianzgruppe zu erstellen. Das Dialogfeld Neue Varianzgruppe erscheint.

4.	Geben Sie den Namen der neuen Gruppe ein.

5.	Klicken Sie auf OK. Das Dialogfeld Varianzgruppe bearbeiten erscheint. Verwenden Sie die Liste Verfügbare Beobachtungen, um die Beobachtungen auszuwählen, die zu der neuen Gruppe hinzugefügt werden sollen.

6.	Wählen Sie die gewünschte Beobachtung.

TIP: Klicken Sie auf Filter, um das Dialogfeld Beobachtungsfilter anzuzeigen, das Optionen zum Filtern der Beobachtungen in der Liste Verfügbare Beobachtungen enthält.

7.	Klicken Sie auf Hinzufügen.

8.	Wiederholen Sie die Schritte 1 bis 7 solange, bis Sie die Gruppe erstellt haben.

9.	Klicken Sie auf OK. Die Änderungen werden im Projekt gespeichert.


Transformationsparameter definieren

Überblick und weitere Informationen
ACHTUNG: Seien Sie beim Ändern der Wertefelder für die Transformationsparameter besonders vorsichtig. Sie benötigen ein umfangreiches Wissen über die Netzausgleichungstheorie und über die Ausgleichung der kleinsten Quadrate, bevor Sie diese Änderungen vornehmen können.

So ändern Sie einen Parameterwert:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

5.	Wählen Sie das Wertefeld für den gewünschten Transformationsparameter.

6.	Geben Sie den neuen Parameterwert ein.

Beachten Sie die folgenden Richtlinien:

  Winkelwerte werden als GGG.MMSSssss mit Vorzeichen eingegeben.

  Lineare Werte werden in Projekteinheiten mit Vorzeichen eingegeben.

Richtlinien zur Änderung von Wert und Status individueller Transformationsparameter finden Sie unter folgenden Themen:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet.

7.	Wählen Sie den Status der Transformationsparameter aus der Statusliste. Weitere Informationen erhalten Sie unter den vorstehend genannten Themen.

8.	Wiederholen Sie, falls erforderlich, die Schritte 2 bis 7, um zusätzliche Werte für Transformationsparameter zu ändern.

Es kann erforderlich sein, die Wert- und Statusoptionen für verschiedene Parameter zu ändern, um die gewünschte Transformation zu erzeugen.

9.	Klicken Sie auf OK.

Die Änderungen werden auf die Transformationsgruppe angewendet.


Transformationsgruppen löschen

 Überblick und weitere Informationen

Benutzerdefinierte Transformationsgruppen können gelöscht werden, wenn sie nicht länger benötigt werden. Wenn eine Transformationsgruppe gelöscht wird, wird sie aus dem Projekt entfernt und ist nicht länger verfügbar.

HINWEIS: Die Transformationsgruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> und <Geoid-Voreinstellung> können nicht gelöscht werden. Die Schaltflächen Löschen werden automatisch deaktiviert, wenn nur voreingestellte Gruppen aufgelistet sind.

So löschen Sie eine Gruppe:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Klicken Sie auf das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die Gruppe.

4.	Klicken Sie auf Löschen.

Die Gruppe wird gelöscht.


Varianzgruppen löschen

 Überblick und weitere Informationen

Varianzgruppen können gelöscht werden, wenn sie nicht länger benötigt werden. Wenn eine Varianzgruppe gelöscht wird, wird sie aus dem Projekt entfernt und ist nicht länger verfügbar.

HINWEIS: Die Varianzgruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> und <Geoid-Voreinstellung> können nicht gelöscht werden. Die Schaltflächen Löschen werden automatisch deaktiviert, wenn nur voreingestellte Gruppen aufgelistet sind.

So löschen Sie eine Gruppe:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Löschen.

Die Gruppe wird gelöscht.


Netzausgleichungsstile löschen

Netzausgleichungsstile können gelöscht werden, wenn sie nicht länger benötigt werden. Wenn ein Netzausgleichungsstil gelöscht wird, wird er aus dem Projekt entfernt und ist nicht länger verfügbar.

HINWEIS: Es muß mindestens ein Stil in der Stil-Liste enthalten sein. Die Schaltfläche Löschen wird automatisch deaktiviert, wenn nur noch ein Stil in der Liste vorhanden ist. Wenn Sie den letzten Stil löschen und durch einen anderen Stil ersetzen möchten, klicken Sie auf Neu, um einen neuen Stil zu erstellen. Neue Stile werden auf der Grundlage des Stils 95% Vertrauensgrenzen erstellt. Weitere Informationen finden Sie unter Netzausgleichungsstile erstellen.

So löschen Sie einen Stil:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Löschen. Sie werden aufgefordert, das Löschen zu bestätigen.

4.	Klicken Sie auf Ja, um den Stil zu löschen.


Beobachtungen in Ausgleichungen und Neuberechnungen deaktivieren

 Überblick und weitere Informationen

Wenn Sie eine Beobachtung nicht länger in Netzausgleichungen oder Neuberechnungen verwenden möchten, können Sie sie deaktivieren. Deaktivierte Beobachtungen werden aus dem Dialogfeld Beobachtungen entfernt, aber die Daten werden nicht endgültig aus dem Projekt gelöscht.

Zwei Methoden können zur Deaktivierung von Beobachtungen verwendet werden.

So deaktivieren Sie Beobachtungen im Dialogfeld Beobachtungen:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Rollen Sie zur gewünschten Beobachtung.

TIP: Sie können die Beobachtungen in der Liste Verfügbare Beobachtungen filtern, um Beobachtungstypen zeitweise auszublenden und die Liste übersichtlicher zu gestalten. Kürzere Listen erleichtern das Auffinden von Beobachtungen.

4.	Klicken Sie mit der rechten Maustaste auf die Beobachtung, um auf ein Verknüpfungsmenü zuzugreifen, und wählen Sie Beobachtung deaktivieren. Die Beobachtung wird aus der Liste entfernt und nicht länger in Netzausgleichungen und Neuberechnungen verwendet. Deaktivierte Beobachtung werden in der Vermessungsansicht rot dargestellt.

5.	Klicken Sie auf OK. Die Änderungen werden im Projekt gespeichert.

So deaktivieren Sie Beobachtungen im Graphikfenster:

1.	Doppelklicken Sie auf die Beobachtung. Das Eigenschaftsfenster erscheint.

2.	Klicken Sie auf die Menüschaltfläche Seite Zusammenfassung [image]. Die Seite Zusammenfassung erscheint.

3.	Wählen Sie in der Statusliste die Option Deaktiviert.

Wenn Sie eine deaktivierte Beobachtung erneut aktivieren möchten, müssen Sie die Beobachtungseigenschaften im Graphikfenster bearbeiten.

HINWEIS: Verwechseln Sie nicht das Deaktivieren einer Beobachtung mit dem Ausschließen einer Beobachtung. Ausgeschlossene Beobachtungen werden ebenso wie deaktivierte Beobachtungen nicht in Netzausgleichungen oder Neuberechnungen verwendet, sie erscheinen jedoch weiterhin in der Liste Beobachtungen. Die Beobachtungsdaten werden nicht endgültig aus dem Projekt gelöscht, daher kann die zuvor ausgeschlossene Beobachtung erneut verwendet werden.


Die Kovarianz-Anzeige für den Ausgleichungsstil bearbeiten

 Überblick und weitere Informationen

Die Einstellungen für die Kovarianz-Anzeige können jederzeit zwischen Ausgleichungen bearbeitet werden.

So bearbeiten Sie die Einstellungen für die Kovarianz-Anzeige:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

4.	Bearbeiten Sie im Register Kovarianz-Anzeige die folgenden Optionen, falls erforderlich:

  Horizontal

  Dreidimensional

5.	Klicken Sie auf OK, wenn Sie die Optionen bearbeitet haben. Die Änderungen werden auf den Ausgleichungsstil angewendet.


Die allgemeinen Ausgleichungsstil-Optionen bearbeiten

Die Allgemeinen Optionen können jederzeit zwischen Ausgleichungen bearbeitet werden.

So bearbeiten Sie die allgemeinen Einstellungen:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

4.	Aktivieren oder deaktivieren Sie im Register Allgemein die folgenden Kontrollkästchen:

 Reduziertes Spaltenprofil verwenden

 Kovarianzwerte auf beobachtete Linien beschränken

 Korrelationen für Geoid-Modell berechnen

5.	Bearbeiten Sie die Optionen für die Restwert-Toleranzen.

6.	Bearbeiten Sie die Optionen für die Sigma-Skalare.

7.	Geben Sie einen neuen Wert in das Feld Maximale Iterationen ein.

8.	Klicken Sie auf OK, um die Änderungen zu speichern.


Die Stiloptionen für die Terrestrischen Steuerungen bearbeiten

 Überblick und weitere Informationen

Sie können die Optionen für die Terrestrischen Steuerungen jederzeit zwischen Ausgleichungen bearbeiten.

So bearbeiten Sie die Optionen:

1.	Wählen Sie Ausgleichung / Auslgeichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

4.	Bearbeiten Sie im Register Terrestrische Steuerungen die Werte der mittleren Fehler für die relevanten Messungen.

5.	Wählen oder deaktivieren Sie das Kontrollkästchen Vertikale Ausgleichung durchführen. Diese Option wird für die Ausgleichung von 3D-Polygonzügen oder Nivellierdaten verwendet.

6. 	Wählen oder deaktivieren Sie das Kontrollkästchen Horizontale Ausgleichung durchführen. Diese Option wird für die Ausgleichung von 2D-Polygonzügen verwendet.

7. 	Klicken Sie auf OK, um die Änderungen zu speichern.


Transformationsgruppen bearbeiten

 Überblick und weitere Informationen

Bei der Bearbeitung einer GPS- oder terrestrischen Transformationsgruppe können verschiedene Vorgänge durchgeführt werden. Es können u.a. Beobachtungen aus einer Gruppe entfernt oder zur Gruppe hinzugefügt und Transformationsparameter können definiert werden. Die Bearbeitung der Geoid-Transformationsgruppe ist auf die Definition von Transformationsparametern beschränkt.

So bearbeiten Sie eine GPS-, terrestrische oder Geoid-Transformationsgruppe:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die Transformationsgruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

5.	Fügen Sie Beobachtungen hinzu oder entfernen Sie sie (siehe unten, nur GPS und terrestrisch)

6.	Definieren Sie Transformationsparameter (siehe unten) oder legen Sie die Einstellung für die Berechnung der Parameter fest (GPS, terrestrisch oder Geoid).

So filtern Sie Beobachtungen in einer GPS-Transformationsgruppe:

1.	Klicken Sie auf Filter. Das Dialogfeld Beobachtungsfilter erscheint. Die Kontrollkästchen sind anfänglich für alle Beobachtungstypen aktiviert, so daß alle Beobachtungen in der Liste Verfügbare Beobachtungen angezeigt werden.

2.	Deaktivieren Sie eine beliebige Kombination der Kontrollkästchen, um Beobachtungstypen auszublenden. Das Filtern wirkt sich nur auf die aktuelle Bearbeitungssitzung aus. Wenn das Dialogfeld geschlossen wird, werden die Filter auf ihre ursprünglichen Werte zurückgesetzt.

So fügen Sie GPS- oder terrestrische Beobachtungen hinzu:

1.	Wählen Sie die Beobachtung aus der Liste Verfügbare Beobachtungen. Die Beobachtung wird hervorgehoben, und die Schaltfläche Hinzufügen wird verfügbar.

HINWEIS: Das Transformationsfeld in der Liste Verfügbare Beobachtungen enthält Transformationsgruppen, die bereits mit Beobachtungen verknüpft sind. Richten Sie sich nach diesem Feld, wenn Sie Beobachtungen hinzufügen. Individuelle Beobachtungen können nur einer Transformationsgruppe zugeordnet werden.

2.	Klicken Sie auf Hinzufügen.

Die Beobachtung wird zu der Liste Gruppenbeobachtungen hinzugefügt.

So entfernen Sie GPS- oder terrestrische Beobachtungen aus einer Transformationsgruppe:

1.	Wählen Sie die Beobachtung aus der Liste Gruppenbeobachtungen. Die Beobachtung wird hervorgehoben, und die Schaltfläche Entfernen wird verfügbar.

2.	Klicken Sie auf Entfernen. Die Beobachtung wird aus der Liste Gruppenbeobachtungen entfernt.

HINWEIS: Es können keine Beobachtungen aus den Transformationsgruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> oder <Geoid-Voreinstellung> entfernt werden.

HINWEIS: Der Status der entfernten Beobachtung ändert sich in der Liste Verfügbare Beobachtungen. Das Transformationsfeld für die Beobachtung wird gelöscht, und die Beobachtung kann zu anderen Transformationsgruppen hinzugefügt werden.

So definieren Sie Transformationsparameter für eine GPS-, terrestrische oder Geoid-Transformationsgruppe:

ACHTUNG: Seien Sie beim Ändern der Werte- und Statusfelder für Transformationsparameter besonders vorsichtig. Sie benötigen ein umfangreiches Wissen über die Netzausgleichungstheorie und über Ausgleichungen der kleinsten Quadrate, bevor Sie diese Änderungen vornehmen können. Eine Liste mit Publikationen zur Netzausgleichungstheorie und zu Ausgleichungen der kleinsten Quadrate finden Sie in der Bibliographie.

1.	Wählen Sie das Wertefeld für den gewünschten Parameter.

2.	Bearbeiten Sie das Feld unter Beachtung der in einem der nachfolgenden Themen enthaltenen Richtlinien:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet.

3.	Wählen Sie die entsprechende Option aus der Statusliste. Weitere Informationen finden Sie unter den vorstehend genannten Themen.

4.	Klicken Sie auf OK, um die Änderungen im Projekt zu speichern.


Varianzgruppen bearbeiten

 Überblick und weitere Informationen

Varianzgruppen können zwischen Ausgleichungen bearbeitet werden.

HINWEIS: Mit der Schaltfläche Bearbeiten für die Geoid-Transformationsgruppe können Sie die Gruppe nur ansehen.

So bearbeiten Sie eine Gruppe:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Varianzgruppe bearbeiten erscheint. In der Liste Gruppenbeobachtungen werden die in der Gruppe enthaltenen Beobachtungen angezeigt. Die Liste Verfügbare Beobachtungen enthält alle aktivierten Netzausgleichungsbeobachtungen.

So fügen Sie Beobachtungen hinzu:

1.	Wählen Sie eine Beobachtung aus der Liste Verfügbare Beobachtungen. Die Beobachtung wird hervorgehoben, und die Schaltfläche Hinzufügen wird verfügbar.

2.	Klicken Sie auf Hinzufügen.

Die Beobachtung wird zu der Liste der Gruppenbeobachtungen hinzugefügt und aus der Liste Verfügbare Beobachtungen entfernt.

So entfernen Sie Beobachtungen:

1.	Wählen Sie die Beobachtung aus der Liste Gruppenbeobachtungen. Die Beobachtung wird hervorgehoben, und die Schaltfläche Entfernen wird verfügbar.

2.	Klicken Sie auf Entfernen.

Die Beobachtung wird aus der Liste Gruppenbeobachtungen entfernt und erscheint in der Liste Verfügbare Beobachtungen.

So speichern Sie Beobachtungen:

  Klicken Sie auf OK.

Die Änderungen werden im Projekt gespeichert.


Koordinaten in der Punktliste bearbeiten

 Überblick und weitere Informationen

Sie können die Koordinaten eines in der Punktliste enthaltenen Punktes zwischen Ausgleichungen bearbeiten.

1.	Wählen Sie Ausgleichung / Punkte. Das Dialogfeld Punkte erscheint.

2.	Verwenden Sie die Bildlaufleiste, um zu dem zu bearbeitenden Punkt zu gelangen.

3.	Wählen Sie Koordinatenkomponente, die Sie bearbeiten möchten.

Wenn eine Koordinatenkomponente bearbeitet wird, wird das Kontrollkästchen der Komponente (in der Gruppe Festhalten) automatisch gewählt.

Wenn eine Koordinatenkomponente in der Gruppe Festhalten deaktiviert wird, wird der Wert für die Komponente auf den Wert zurückgesetzt, der vor der Bearbeitung der Koordinate im Feld gespeichert wurde.

4.	Wiederholen Sie die vorstehend beschriebenen Schritte, um weitere Punkte zu bearbeiten.

5.	Klicken Sie auf OK, wenn Sie die Bearbeitung beendet haben.

Die Änderungen werden in der ausgewählten Projektansicht (WGS-84, Gitter oder Örtlich) im Projekt gespeichert.


Gewichtungsstrategien bearbeiten

Überblick und weitere Informationen
Gewichtungsstrategien können zwischen Ausgleichungen definiert und angewendet werden.

So bearbeiten Sie Gewichtungsstrategien:

1.	Wählen Sie Ausgleichung / Gewichtungsstrategien. Das Dialogfeld Gewichtungsstrategien erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid. Die entsprechenden Beobachtungen werden angezeigt.

3.	Stellen Sie in der Gruppe Skalare anwenden auf eine der folgenden Optionen ein: Alle Beobachtungen, Jede Beobachtung oder Varianzgruppen.

HINWEIS: Die Option Alle Beobachtungen ist die einzig verfügbare Option für die Geoid-Transformationsgruppe.

4.	Führen Sie einen der nachfolgenden Schritte aus:

  Gehen Sie direkt zu Schritt 6, wenn Sie unter 3. die Option Alle Beobachtungen oder Jede Beobachtung gewählt haben.

  Gehen Sie zu Schritt 5, wenn Sie die Option Varianzgruppen gewählt haben.

HINWEIS: Wenn Sie die Option Jede Beobachtung gewählt haben, steht der Skalartyp Benutzerdefiniert nicht zur Verfügung.

5.	Wenn Sie unter 3. die Option Varianzgruppen gewählt haben, wird die Liste der Beobachtungen durch die Gruppenliste ersetzt, und alle Varianzgruppen werden angezeigt. Führen Sie die folgenden Schritte aus:

a.	Stellen Sie den Skalartyp auf Voreinstellung, Alternativ, Benutzerdefiniert oder Automatisch ein.

b.	Führen Sie einen der folgenden Schritte aus:

  Gehen Sie zu Schritt 8, wenn Sie unter 5. die Option Voreinstellung, Alternativ oder Automatisch gewählt haben.

  Wenn Sie Benutzerdefiniert gewählt haben, erscheint der Cursor im Skalarfeld der Gruppenliste, und Sie können einen Skalarwert eingeben.

c.	Fahren Sie mit Schritt 8 fort, wenn Sie einen Skalarwert eingegeben haben.

6.	Stellen Sie den Skalartyp auf Voreinstellung, Alternativ, Benutzerdefiniert oder Automatisch ein.

7.	Führen Sie einen der folgenden Schritte aus:

  Gehen Sie direkt zu Schritt 8, wenn Sie Voreinstellung, Alternativ oder Automatisch gewählt haben.

  Wenn Sie Benutzerdefiniert gewählt haben, wird das Feld Skalarwert verfügbar, und Sie können einen Skalarwert eingeben. Geben Sie den Wert ein, und führen Sie den nächsten Schritt aus.

8.	Klicken Sie auf OK oder auf Anwenden.

Die Änderungen werden gespeichert.


Die Standpunktfehler-Einstellungen für den Ausgleichungsstil bearbeiten

Überblick und weitere Informationen
Die Optionen für Standpunktfehler können jederzeit zwischen Ausgleichungen geändert werden.

So bearbeiten Sie die Optionen für Standpunktfehler:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Ausgleichungsstil bearbeiten erscheint.

4.	Wählen Sie das Register Standpunktfehler. Die Optionen für Standpunktfehler werden angezeigt. Führen Sie, falls erforderlich, folgende Schritte aus:

a.	Geben Sie einen neuen Wert in das Feld Fehler in Antennenhöhe oder Fehler in Instrumentenhöhe ein.

b.	Geben Sie einen neuen Wert in die Felder Zentrierfehler ein.

5.	Klicken Sie auf OK, wenn Sie die Änderungen durchgeführt haben.

Die Änderungen werden gespeichert.


Beobachtungen in eine Netzausgleichung einschließen

Überblick und weitere Informationen
Beobachtungen, die zuvor aus einer Netzausgleichung ausgeschlossen wurden, können erneut in die Ausgleichung eingeschlossen werden.

So schließen Sie Beobachtungen in eine Netzausgleichung ein:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid. Die Liste Beobachtungen erscheint.

3.	Verwenden Sie die Bildlaufleiste, um zu den Beobachtungen zu gelangen.

4.	Klicken Sie auf die Kontrollkästchen in der Spalte ‘Verwenden‘, um Beobachtungen in die Netzausgleichung einzuschließen

TIP:  Sie können die Umschalt-Taste oder die Taste Strg verwenden, um mehrere Beobachtungen auszuwählen.

5.	Klicken Sie auf OK.

Die Änderungen werden im Projekt gespeichert.

HINWEIS: Weitere Informationen über das Ausschließen von Beobachtungen aus einer Ausgleichung finden Sie unter Beobachtungen ausschließen.

HINWEIS: Beobachtungen können auch deaktiviert und erneut aktiviert werden. Weitere Informationen finden Sie unter Beobachtungen deaktivieren und Deaktivierte Beobachtungen erneut aktivieren.

HINWEIS: Sie können auch das Eigenschaftsfenster verwenden, um Beobachtungen in eine Ausgleichung einzuschließen. Wählen Sie dazu das Kontrollkästchen Bei der Netzausgleichung verwenden auf der Seite Zusammenfassung.


Den Netzausgleichungsbericht bewerten

Überblick und weitere Informationen
Wenn aufeinanderfolgende Ausgleichungen durchgeführt werden, können die Ergebnisse im Netzausgleichungsbericht angesehen werden. Basierend auf der Bewertung dieser Ergebnisse, werden Vorgänge für eine schnelle Konvergenz des Netzes durchgeführt. Es kann erforderlich sein, für diese Vorgänge die Ausgleichungsstile anzupassen, Beobachtungen ein- oder auszuschließen, sie zu aktivieren oder zu deaktivieren, Geoid-Abstände zu laden, Transformationsgruppen zu erstellen, um Transformationen auf Beobachtungsgruppen anzuwenden, Varianzgruppen zu erstellen, Gewichtungsstrategien anzuwenden, Koordinatenkomponenten für Festpunkte festzuhalten sowie weitere Vorgänge durchzuführen.

So bewerten Sie einen Bericht:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Der Bericht wird erzeugt. Das für Ihren Computer voreingestellte HTML-Anzeigemodul wird gestartet, und Sie können den Bericht ansehen.

2.	Navigieren Sie durch den Bericht, um ausgewählte Statistiken anzusehen und die Resultate zu bewerten.

Die nachstehend aufgeführten Themen enthalten allgemeine Richtlinien zur Bewertung von Berichtstatistiken. Weiterführende Informationen finden Sie in der Bibliographie.

Die folgenden Themen enthalten Richtlinien zur Bewertung von Berichtabschnitten:

  Ausgleichungsstil-Einstellungen

  Restwert-Toleranzen

  Kovarianz-Anzeige

  Terrestrische Steuerungen

  Standpunktfehler

  Statistische Zusammenfassung

  Anzahl Iterationen

  Globale Statistik

  GPS-Beobachtungsstatistik

  Geoid-Modell-Statistik

  Terrestrische Beobachtungsstatistik

  Gewichtungsstrategien

  Ausgeglichene Koordinaten

  Gitternetz-Koordinaten

  Geodätische Koordinaten

  Koordinaten-Deltas

  Festpunktkoordinatenvergleiche

  Ausgeglichene Beobachtungen

  GPS-Beobachtungen

  Geoid-Beobachtungen

  Terrestrische Beobachtungen

  Histogramme der standardisierten Restwerte

  Punktfehlerellipsen

  Kovarianzwerte


Beobachtungen filtern

Überblick und weitere Informationen
Das Filtern ist nützlich, wenn Sie eine große Anzahl von GPS- oder terrestrischen Beobachtungen ansehen. Sie können die Beobachtungen zeitweise filtern, während das Dialogfeld geöffnet ist. Gefilterte Beobachtungstypen werden ausgeblendet, und die Liste wird dadurch kürzer. Wenn die Beobachtungsliste gefiltert wird, erscheint ‘Gefiltert’ in der Titelleiste des Dialogfelds. Alle Filter werden automatisch entfernt, wenn Sie das Dialogfeld verlassen.

So filtern Sie Beobachtungen:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch. Die Liste Beobachtungen erscheint.

3.	Klicken Sie auf Filter. Das Dialogfeld Beobachtungsfilter erscheint.

4.	Wählen Sie die gewünschten Kontrollkästchen, um die Beobachtungsliste zu filtern. Gemäß Voreinstellung sind alle Kontrollkästchen aktiviert.

Für das Filtern terrestrischer Beobachtungen sollten Sie alle Beobachtungen ausgewählt lassen, wenn Sie nicht genau wissen, welche Beobachtungstypen Sie wählen sollen. Wenn Sie eine Option wählen, ist dies gleichbedeutend mit der Auswahl einer Teilbeobachtung. Wenn Sie zum Beispiel den Filter Ellipsoid-Strecke wählen, dann werden nur Beobachtungen angezeigt, die eine Ellipsoid-Strecke enthalten. Beobachtungen mit horizontalen Winkeln und Ellipsoid-Strecken werden nur dann angezeigt, wenn Sie beide Filteroptionen wählen.

  Wenn Sie das Kontrollkästchen Azimut wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden nur Beobachtungen mit eingegebenen Azimuten angezeigt.

  Wenn Sie das Kontrollkästchen Höhenunt. wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden Nivellierdaten ausgewählt.

  Wenn Sie Rohbeobachtungen ansehen möchten, wählen Sie die Kontrollkästchen Horizontaler Winkel, Ellipsoid-Strecke und Trig. Höhe.

5.	Klicken Sie auf OK.

Die gewählten Beobachtungstypen werden ausgeblendet, aber noch weiterhin in der Netzausgleichung verwendet.


Beobachtungen mit Skalargewichtungen filtern

Überblick und weitere Informationen
Das Filtern ist nützlich, wenn Sie eine große Anzahl unterschiedlicher GPS- oder terrestrischer Beobachtungen ansehen. Sie können die Beobachtungen zeitweise filtern, während das Dialogfeld geöffnet ist. Gefilterte Beobachtungstypen werden ausgeblendet, und die Liste wird dadurch kürzer. Wenn die Beobachtungsliste gefiltert wird, erscheint ‘Gefiltert’ in der Titelleiste des Dialogfelds. Alle Filter werden automatisch entfernt, wenn Sie das Dialogfeld verlassen.

So filtern Sie Beobachtungen:

1.	Wählen Sie Ausgleichung / Gewichtungsstrategien. Das Dialogfeld Gewichtungsstrategien erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch. Die Liste Beobachtungen erscheint.

3.	Klicken Sie auf Filter. Das Dialogfeld Beobachtungsfilter erscheint. Gemäß Voreinstellung sind alle Kontrollkästchen aktiviert.

4.	Wählen Sie die gewünschten Kontrollkästchen, um die Liste Verfügbare Beobachtungen zu filtern. Wenn Sie auf ein aktiviertes Kontrollkästchen klicken, wird das entsprechende Häkchen entfernt, und die Beobachtungen werden ausgeblendet. Wenn Sie alle Kontrollkästchen deaktivieren, werden alle Beobachtungen ausgeblendet.

Für das Filtern terrestrischer Beobachtungen sollten Sie alle Beobachtungen ausgewählt lassen, wenn Sie nicht genau wissen, welche Beobachtungstypen Sie wählen sollen. Wenn Sie eine Option wählen, ist dies gleichbedeutend mit der Auswahl einer Teilbeobachtung. Wenn Sie zum Beispiel den Filter Ellipsoid-Strecke wählen, dann werden nur Beobachtungen angezeigt, die eine Ellipsoid-Strecke enthalten. Beobachtungen mit horizontalen Winkeln und Ellipsoid-Strecken werden nur dann angezeigt, wenn Sie beide Filteroptionen wählen.

  Wenn Sie das Kontrollkästchen Azimut wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden nur Beobachtungen mit eingegebenen Azimuten angezeigt.

  Wenn Sie das Kontrollkästchen Höhenunt. wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden Nivellierdaten ausgewählt.

 Wenn Sie Rohbeobachtungen ansehen möchten, wählen Sie die Kontrollkästchen Horizontaler Winkel, Ellipsoid-Strecke und Trig. Höhe

5.	Klicken Sie auf OK.

Die gewählten Beobachtungstypen werden ausgeblendet, aber noch weiterhin in der Netzausgleichung verwendet.


Beobachtungen in Transformationsgruppen filtern

Überblick und weitere Informationen
Das Filtern ist nützlich, wenn Sie eine große Anzahl unterschiedlicher GPS- oder terrestrischer Beobachtungen ansehen. Sie können die Beobachtungen zeitweise filtern, wenn das Dialogfeld geöffnet ist. Gefilterte Beobachtungstypen werden ausgeblendet, und die Liste wird dadurch kürzer. Wenn die Beobachtungsliste gefiltert wird, erscheint ‘Gefiltert’ in der Titelleiste des Dialogfelds. Alle Filter werden automatisch entfernt, wenn Sie das Dialogfeld verlassen.

So filtern Sie Beobachtungen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Wählen Sie eine Gruppe, und klicken Sie auf Bearbeiten. Die Liste Verfügbare Beobachtungen erscheint.

4.	Klicken Sie auf Filter. Das Dialogfeld Beobachtungsfilter erscheint. Gemäß Voreinstellung sind alle Kontrollkästchen aktiviert.

Wählen Sie die gewünschten Kontrollkästchen, um die Liste Verfügbare Beobachtungen zu filtern. Wenn Sie auf ein aktiviertes Kontrollkästchen klicken, wird das entsprechende Häkchen entfernt und die Beobachtungen werden ausgeblendet. Wenn Sie alle Kontrollkästchen deaktivieren, werden alle Beobachtungen ausgeblendet.

Für das Filtern terrestrischer Beobachtungen sollten Sie alle Beobachtungen ausgewählt lassen, wenn Sie nicht genau wissen, welche Beobachtungstypen Sie wählen sollen. Wenn Sie eine Option wählen, ist dies gleichbedeutend mit der Auswahl einer Teilbeobachtung. Wenn Sie zum Beispiel den Filter Ellipsoid-Strecke wählen, dann werden nur Beobachtungen angezeigt, die eine Ellipsoid-Strecke enthalten. Beobachtungen mit horizontalen Winkeln und Ellipsoid-Strecken werden nur dann angezeigt, wenn Sie beide Filteroptionen wählen.

  Wenn Sie das Kontrollkästchen Azimut wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden nur Beobachtungen mit eingegebenen Azimuten angezeigt.

  Wenn Sie das Kontrollkästchen Höhenunt. wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden Nivellierdaten ausgewählt.

  Wenn Sie Rohbeobachtungen ansehen möchten, wählen Sie die Kontrollkästchen Horizontaler Winkel, Ellipsoid-Strecke und Trig. Höhe

5.	Klicken Sie auf OK.

Die gewählten Beobachtungstypen werden ausgeblendet, aber noch weiterhin in der Netzausgleichung verwendet.


Beobachtungen in Varianzgruppen filtern

Überblick und weitere Informationen
Das Filtern ist nützlich, wenn Sie eine große Anzahl unterschiedlicher GPS-Beobachtungen ansehen. Sie können die Beobachtungen zeitweise filtern, wenn das Dialogfeld geöffnet ist. Gefilterte Beobachtungstypen werden ausgeblendet, und die Liste wird dadurch kürzer. Wenn die Beobachtungsliste gefiltert wird, erscheint ‘Gefiltert’ in der Titelleiste des Dialogfelds. Alle Filter werden automatisch entfernt, wenn Sie das Dialogfeld verlassen.

So filtern Sie Beobachtungen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Wählen Sie eine Gruppe, und klicken Sie auf Bearbeiten. Die Liste Verfügbare Beobachtungen erscheint.

4.	Klicken Sie auf Filter. Das Dialogfeld Beobachtungsfilter erscheint. Gemäß Voreinstellung sind alle Kontrollkästchen aktiviert.

Wählen Sie die gewünschten Kontrollkästchen, um die Liste Verfügbare Beobachtungen zu filtern. Wenn Sie auf ein aktiviertes Kontrollkästchen klicken, wird das entsprechende Häkchen entfernt und die Beobachtungen werden ausgeblendet. Wenn Sie alle Kontrollkästchen deaktivieren, werden alle Beobachtungen ausgeblendet.

Für das Filtern terrestrischer Beobachtungen sollten Sie alle Beobachtungen ausgewählt lassen, wenn Sie nicht genau wissen, welche Beobachtungstypen Sie wählen sollen. Wenn Sie eine Option wählen, ist dies gleichbedeutend mit der Auswahl einer Teilbeobachtung. Wenn Sie zum Beispiel den Filter Ellipsoid-Strecke wählen, dann werden nur Beobachtungen angezeigt, die eine Ellipsoid-Strecke enthalten. Beobachtungen mit horizontalen Winkeln und Ellipsoid-Strecken werden nur dann angezeigt, wenn Sie beide Filteroptionen wählen.

  Wenn Sie das Kontrollkästchen Azimut wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden nur Beobachtungen mit eingegebenen Azimuten angezeigt.

  Wenn Sie das Kontrollkästchen Höhenunt. wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden Nivellierdaten ausgewählt.

  Wenn Sie Rohbeobachtungen ansehen möchten, wählen Sie die Kontrollkästchen Horizontaler Winkel, Ellipsoid-Strecke und Trig. Höhe

5.	Klicken Sie auf OK.

Die gewählten Beobachtungstypen werden ausgeblendet, aber noch weiterhin in der Netzausgleichung verwendet.


Geoid-Abstände laden

Überblick und weitere Informationen
Bevor orthometrische Höhen für Punkte berechnet oder festgehalten werden können, muß dem Projekt ein Geoid-Modell zugeordnet werden, und die Geoid-Abstände müssen in das Projekt geladen werden.

Normalerweise werden Geoid-Abstände geladen, nachdem Koordinaten an jedem Punkt berechnet wurden. Für die Koordinatenberechnung wird eine vollständig bedingte Ausgleichung unter Verwendung des Datums, das für das Geoid-Modell definiert wurde, durchgeführt.

HINWEIS: In dieser Hilfe-Datei wird der Begriff ‘Geoid-Beobachtungen’ zur Beschreibung von Geoid-Abständen benutzt, die in Netzausgleichungen verwendet werden. Die Geoid-Abstände werden zwar in das Projekt geladen, aber nur für Ausgleichungen verwendet.

So laden Sie Geoid-Abstände:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register Geoid.

3.	Führen Sie einen der folgenden Schritte aus:

  Wenn zuvor Geoid-Abstände geladen wurden, werden die Beobachtungen in der Liste Beobachtungen angezeigt, und Sie können diesen Vorgang jetzt abbrechen.

  Wenn die Liste der Beobachtungen leer ist, wurden keine Geoid-Abstände in das Projekt geladen, und Sie sollten diesen Vorgang durchführen.

4.	Klicken Sie auf Laden. Die Geoid-Abstände für alle entsprechenden Punkte werden in das Projekt geladen und in der Beobachtungsliste angezeigt.

HINWEIS: Die Schaltfläche Laden ist deaktiviert, wenn für das Projekt kein Geoid-Modell definiert wurde.

HINWEIS: Geoid-Abstände werden an der aktuellen Punktposition interpoliert. Wenn sich die Punktpositionen erheblich verändert haben, sollten Sie die Geoid-Abstände erneut laden.

5.	Klicken Sie auf OK.

Die Änderungen werden gespeichert.


Spalten verschieben

Überblick und weitere Informationen
Die Spalten in der Liste Beobachtungen können an eine neue Position in der Liste verschoben werden.

So verschieben Sie die Spalten:

1.	Positionieren Sie den Cursor in einer beliebigen Beobachtungsliste auf der Kopfzeile der Spalte. Die Kopfzeile enthält den Spaltentitel und befindet sich über der ersten Datenreihe.

2.	Führen Sie einen der folgenden Schritte aus:

  Um eine Spalte nach rechts zu verschieben: ziehen Sie den Spaltenkopf nach rechts, bis die linke Seite des Spaltenkopfes über die Position hinausgeht, an der Sie die Spalte einfügen möchten, und lassen Sie dann die Maustaste los.

  Um eine Spalte nach links zu verschieben: ziehen Sie den Spaltenkopf nach links, bis die rechte Seite des Spaltenkopfes über die Position hinausgeht, an der Sie die Spalte einfügen möchten, und lassen Sie dann die Maustaste los.


Navigation in Netzausgleichungsberichten

Überblick und weitere Informationen
Verwenden Sie die Befehle Ihres voreingestellten HTML-Anzeigemoduls, um durch Netzausgleichungsberichte zu navigieren.

Beachten Sie folgende Richtlinien:

  Verwenden Sie die Hyperlinks im Inhaltsverzeichnis, um zu bestimmten Berichtabschnitten zu navigieren.

  Verwenden Sie den entsprechenden Befehl des HTML-Anzeigemoduls, um zum Seitenanfang zu navigieren. In der Regel wird die Schaltfläche Zurück dafür verwendet.

  Verwenden Sie die Tasten Bild-auf und Bild-ab oder die Bildlaufleisten, um zu den Berichtabschnitten zu navigieren.

  Drücken Sie Alt+Tab, um zwischen der Trimble Geomatics Office Software und dem HTML-Anzeigemodul zu wechseln.


Eine Netzausgleichung entfernen

Überblick und weitere Informationen
Verwenden Sie diesen Befehl, um alle Werte auf die ursprüngliche Konfiguration vor der Netzausgleichung zurückzusetzen.

Wählen Sie Ausgleichung / Ausgleichung entfernen, um ausgeglichene Werte zu entfernen.

Wenn Sie diesen Befehl verwenden:

  wird das Datum auf WGS-84 gesetzt

  werden keine Punkte festgehalten

  werden Fehlerellipsen entfernt

  werden Geoid-Abstände entladen

  wird, falls eine Kalibrierung vor der Netzausgleichung vorhanden war, diese erneut angewendet

  werden ausgeglichene Koordinaten entfernt

HINWEIS: Beobachtungen, die für eine Ausgleichung deaktiviert wurden, werden nicht zurückgesetzt.


Kalibrierungskoordinaten entfernen

Überblick und weitere Informationen
Kalibrierungskoordinaten, die nach einer minimal bedingten Ausgleichung im Projekt gespeichert wurden, können entfernt werden.

Wählen Sie Ausgleichung / Kalibrierungskoordinaten / Entfernen, um Kalibrierungskoordinaten zu entfernen.

Die Kalibrierungskoordinaten werden aus dem Projekt entfernt.


Beobachtungen aus Transformationsgruppen entfernen

Überblick und weitere Informationen
Beobachtungen können aus benutzerdefinierten GPS- oder terrestrischen Transformationsgruppen entfernt werden.

HINWEIS: Es können keine Beobachtungen aus der Transformationsgruppe <Geoid-Voreinstellung> entfernt werden.

So entfernen Sie Beobachtungen aus einer GPS-Transformationsgruppe:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Wählen Sie eine Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

5.	Wählen Sie die gewünschte Beobachtung aus der Liste Gruppenbeobachtungen. Die Schaltfläche Entfernen wird verfügbar.

6.	Klicken Sie auf Entfernen. Die Beobachtung wird aus der Gruppe entfernt und erscheint in der Liste Verfügbare Beobachtungen.

7.	Klicken Sie auf OK.

Die Änderungen werden in dem Projekt gespeichert.


Beobachtungen aus Varianzgruppen entfernen

Überblick und weitere Informationen
Beobachtungen können aus GPS- oder terrestrischen Varianzgruppen entfernt werden.

HINWEIS: Es können keine Beobachtungen aus der Transformationsgruppe <Geoid-Voreinstellung> entfernt werden.

So entfernen Sie Beobachtungen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Varianzgruppe bearbeiten erscheint.

5.	Wählen Sie die gewünschte Beobachtung aus der Liste Gruppenbeobachtungen. Die Beobachtung wird hervorgehoben, und die Schaltfläche Entfernen wird verfügbar.

6.	Klicken Sie auf Entfernen. Die Beobachtung wird aus der Gruppe entfernt und erscheint in der Liste Verfügbare Beobachtungen.

TIP: Sie können die Liste filtern, um Beobachtungstypen zeitweise auszublenden, und die Liste übersichtlicher zu gestalten. Kürzere Listen erleichtern das Auffinden von Beobachtungen.

7.	Klicken Sie auf OK, um die Änderungen anzuwenden.


Netzausgleichungsstile umbenennen

Überblick und weitere Informationen
Ausgleichungsstile können jederzeit zwischen Ausgleichungen umbenannt werden.

So benennen Sie einen Stil um:

1.	Wählen Sie Ausgleichung / Ausgleichungsstile. Das Dialogfeld Netzausgleichungsstile erscheint.

2.	Wählen Sie den gewünschten Stil aus der Stil-Liste.

3.	Klicken Sie auf Umbenennen. Das Dialogfeld Stil umbenennen erscheint.

4.	Geben Sie den neuen Stilnamen in das Feld Name ein.

5.	Klicken Sie auf OK.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Netzausgleichungsstile zurück.


Die Spaltengröße ändern

Überblick und weitere Informationen
Die Größe der Spalten in der Liste Beobachtungen kann geändert werden, um Informationen anzuzeigen oder auszublenden.

So ändern Sie die Spaltengröße:

1.	Positionieren Sie den Cursor rechts vom entsprechenden Spaltenkopf, bis ein Skalierungscursor erscheint. Die Kopfzeile enthält den Spaltentitel und befindet sich über der ersten Datenreihe.

2.	Halten Sie die linke Maustaste gedrückt, und ziehen Sie den Spaltenkopf bis zur gewünschten Breite. Die Spaltenbreite wird entsprechend geändert, wenn Sie den Cursor bewegen.

Die Spaltengröße wurde geändert.


Kalibrierungskoordinaten speichern

Überblick und weitere Informationen
Nachdem eine minimal bedingte Ausgleichung mit GPS-Daten in einem WGS-84 Datum durchgeführt und WGS-84 Koordinaten an jedem in der Netzausgleichung enthaltenen Punkt erstellt wurden, können diese Koordinaten als beobachtete GPS-Koordinaten für die Kalibrierung verwendet werden.

Die Kalibrierungskoordinaten bestehen aus den WGS-84-Breiten, -Längen und ellipsoidischen Höhen.

HINWEIS: Dieser Befehl steht nur zur Verfügung, wenn Sie WGS-84 als Ausgleichungsdatum gewählt haben und die Ausgleichung ausschließlich mit GPS-Daten durchgeführt wurde.

So speichern Sie Kalibrierungskoordinaten:

1.	Wählen Sie Ausgleichung / Kalibrierungskoordinaten / Speichern. Das Dialogfeld Kalibrierungskoordinaten speichern erscheint.

2.	Wählen Sie in der Gruppe Koordinaten für Kalibrierung speichern die Option Bestehende Punkte oder Neue Punkte mit Suffix.

3.	Klicken Sie auf OK.

Die Kalibrierungskoordinaten werden gespeichert.


Das Datum für eine Ausgleichung wählen

 Überblick und weitere Informationen

Bei einer Ausgleichung haben Sie die Möglichkeit, die Datumsdefinition für die Ausgleichungsresultate festzulegen. Diese Einstellung beeinflußt nicht das im Dialogfeld Projekteigenschaften festgelegte Projektdatum. Bei einer minimal bedingten GPS-Ausgleichung wird das Datum normalerweise auf WGS-84 eingestellt. Stellen Sie das Projektdatum als Datum ein, bevor Sie eine minimal bedingte Ausgleichung für terrestrische Daten durchführen. Wenn Sie bereit sind eine vollständig bedingte Ausgleichung durchzuführen, stellen Sie das Projektdatum als Datum ein.

1.	Wählen Sie Ausgleichung / Datum, um das Datum-Untermenü aufzurufen. Ein Menü mit folgenden Optionen erscheint:

  WGS-84

  Projektdatum - <Datumsbezeichnung>

2.	Wählen Sie das Datum.


Den Festpunktstatus für bedingte Koordinaten festlegen

Sie können die Festpunkteinstellungen verwenden, um Zwangspunkte für die Koordinaten der in der Netzausgleichung enthaltenen Punkte zu erstellen.

HINWEIS: Wenn Sie eine Koordinate eines Punktes (2D, Ellips Höhe und Höhe) im Dialogfeld Punkte festhalten, wird eine ausgeglichene Koordinate erstellt. Sie können die ausgeglichenen Koordinaten im Eigenschaftsfenster ansehen.

So legen Sie die Einstellungen in der Gruppe Festhalten fest:

1.	Wählen Sie Ausgleichung / Punkte. Das Dialogfeld Punkte erscheint.

2.	Verwenden Sie die Bildlaufleiste, um den gewünschten Punkt zu finden, und wählen Sie ihn aus.

3.	Wenn Sie eine Koordinatenkomponente bearbeiten, wird diese automatisch in der Gruppe Festhalten festgehalten.

HINWEIS: Sie können Punkte mit eingegebenen Festpunktkoordinaten an den Bezeichnungen (HR, ellh, h) in der Spalte Fest identifizieren. Die Klammern geben an, daß der Punkt noch nicht festgehalten (noch keine Zwangskoordinaten erstellt) wurde(n).

HINWEIS: Wenn Sie eine Koordinatenkomponente deaktivieren, die bereits festgehalten wurde, werden die Koordinatenkomponenten auf den ursprünglichen Wert zurückgesetzt (d. h. den Wert, der im Dialogfeld vor der Bearbeitung der Koordinatenkomponente angezeigt wurde).

HINWEIS: Sie können die Einstellungen in der Gruppe Festhalten jederzeit ändern, um die Zwangskoordinaten für den Punkt aufzuheben.

4.	Klicken Sie auf OK.

Die Änderungen werden im Projekt gespeichert.


Spalten sortieren

 Überblick und weitere Informationen

Die Beobachtungs- und die Punktliste können in auf- oder absteigender Reihenfolge sortiert werden.

Anfänglich ist die Beobachtungsliste so sortiert, daß die Restwerte am Anfang der Liste angezeigt werden. Die Punktliste wird zuerst nach festgehaltenen Punkte sortiert. Sie können auf den Spaltenkopf einer beliebigen Spalte klicken, um die Liste in auf- oder absteigender Reihenfolge nach Spalteninhalt zu ordnen.

So sortieren Sie eine Spalte:

1.	Positionieren Sie den Cursor über dem Spaltenkopf. Der Kopfzeile enthält den Spaltentitel und befindet sich über der ersten Datenreihe.

2.	Klicken Sie einmal auf die linke Maustaste, um die Spalte in aufsteigender Reihenfolge zu sortieren.

Sie können die Schritte wiederholen, um die Spalte erneut in absteigender Reihenfolge zu sortieren. Sortieren Sie andere Spalten optional in auf- oder absteigender Reihenfolge. Das Sortieren der Spalten erleichtert oft das Auffinden von Daten, vor allem, wenn die Liste eine große Anzahl von Daten enthält.


Ein Netz ausgleichen

Überblick und weitere Informationen
Eine Netzausgleichung ist ein iterativer Prozeß, der mit einem minimal bedingten Ausgleichungsschritt beginnt, auf den weitere Ausgleichungsschritte folgen. Dieser Abschnitt enthält grundlegende Richtlinien zur Durchführung von Ausgleichungen sowie Verweise auf andere Themen, die spezifische Anleitungen für eine schnelle Konvergenz des Netzes enthalten.

Lesen Sie zuerst die folgenden Themen, bevor Sie mit der ersten Ausgleichung beginnen:

1.	Ausgleichungsdatum

2.	Netzausgleichungsstile

3.	Beobachtungen

4.	Punkte

5.	Punkte festhalten

6.	Beobachtungen in eine Ausgleichung  einschließen und ausschließen

7.	Skalargewichtungsstrategien festlegen

8.	Geoid-Abstände laden und entladen

9.	Varianzgruppen erstellen und bearbeiten

10.	Transformationsgruppen erstellen und bearbeiten

Ausgleichungen

Befolgen Sie diese Schritte, um eine Ausgleichung zu starten:

1.	Führen Sie einen der nachfolgenden Schritte aus, um mit der Ausgleichung zu beginnen:

  Wählen Sie Ausgleichung / Ausgleichen.

  Drücken Sie F10.

In der Statusleiste werden Statusmeldungen angezeigt, während die Netzausgleichung durchgeführt wird. Die Ausgleichungsresultate werden im Graphikfenster angezeigt.

2.	Sehen Sie sich den Netzausgleichungsbericht an, und bewerten Sie die Resultate, nachdem die Ausgleichung beendet ist.

Der Bericht enthält, neben den bei der Ausgleichung erzeugten Daten, eine Meldung, die angibt, ob die Ausgleichung erfolgreich war oder nicht.


Geoid-Abstände entladen

Überblick und weitere Informationen
Geoid-Abstände können aus der Ausgleichung entladen werden.

HINWEIS: Die entladenen Geoid-Abstände werden nur aus der Ausgleichung entfernt, nicht aus dem Projekt. Das Geoid ist weiterhin für das Projekt gewählt und wird in Neuberechnungen verwendet.

HINWEIS: In dieser Hilfedatei wird der Begriff ‘Geoid-Beobachtungen’ zur Beschreibung von Geoid-Abständen benutzt, die in der Netzausgleichung verwendet werden.

So entladen Sie Geoid-Abstände:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register Geoid.

3.	Führen Sie einen der nachfolgenden Schritte aus, um zu entscheiden, ob die Abstände entladen werden können:

  Wenn die Liste Beobachtungen leer ist, wurden keine Geoid-Abstände in das Projekt geladen, und Sie können diesen Vorgang jetzt abbrechen.

  Wenn zuvor bereits Geoid-Abstände geladen wurden, werden die Beobachtungen in der Liste Beobachtungen angezeigt, und Sie können diesen Vorgang durchführen.

4.	Klicken Sie auf Entladen. Die Geoid-Abstände werden aus dem Projekt entladen und die Beobachtungsliste wird gelöscht.

5.	Klicken Sie auf OK.

Die Änderungen werden gespeichert.


GPSurvey Daten verwenden

Überblick und weitere Informationen
In der Trimble Geomatics Office Software können Daten aus Trimble GPSurvey-Netzen verwendet werden. Es ist jedoch ein zusätzlicher Schritt zum Importieren der Daten erforderlich. Sie müssen die Dateien mit Basislinienlösungen (.ssf und .ssk) in das Projekt importieren und diese Basislinien (Beobachtungen) dann in der Trimble Geomatics Office Software ausgleichen. Importieren Sie ebenfalls die bekannten Festpunkte unter Verwendung einer in GPSurvey erstellten ASCII-Datei.

So importieren Sie GPSurvey-Daten:

1.	Erstellen Sie ein neues Projekt in der Trimble Geomatics Office Software. Wählen Sie dieselben Projekteigenschaften, die auch für das GPSurvey Projekt gewählt wurden.

2.	Wählen Sie Datei / Importieren, um den Befehl Importieren zu wählen.

3.	Wählen Sie das Register Vermessung.

4.	Wählen Sie SSF/SSK-Dateien (*.ssf, *.ssk).

5.	Klicken Sie auf OK.

6.	Navigieren Sie zu dem Ordner, \GPSurvey\Projekte\*Projektname*\Trimvec, der die gewünschten Dateien enthält.

7.	Markieren Sie die entsprechenden Dateien.

8.	Klicken Sie auf Öffnen. Die Daten werden importiert, und Basislinien werden auf dem Bildschirm angezeigt.

9.	Verwenden Sie das Register Benutzerdefiniert im Dialogfeld Importieren, um die ASCII-Datei, wie vorstehend beschrieben, zu importieren.

Sie können nun zusätzliche GPS-Daten importieren und mit der Ausgleichung in der in Trimble Geomatics Office Software beginnen.


Transformationsparameter überprüfen

Überblick und weitere Informationen
Transformationsparameter können jederzeit zwischen Ausgleichungen überprüft werden.

So überprüfen Sie Transformationsparameter:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Rollen Sie durch die Liste zur gewünschten Gruppe.

4.	Wählen Sie die Gruppe.

5.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

Im Feld Gruppenname wird der Name angezeigt, der der Gruppe zugeordnet wurde. Sehen Sie sich die in der Gruppe enthaltenen Beobachtungen in der Liste Gruppenbeobachtungen und die verfügbaren Projektbeobachtungen in der Liste Verfügbare Beobachtungen an. Die Liste der Transformationsparameter in der linken oberen Ecke enthält die aktuellen Transformationsparameter-Einstellungen.

6.	Überprüfen Sie die Transformationsparameter in der Transformationsparameterliste.

7.	Bearbeiten Sie die Transformationsparameter, falls erforderlich.

Die folgenden Themen enthalten Richtlinien zur Definition von Transformationsparametern:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

8.	Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld zu verlassen:

  Klicken Sie auf Abbrechen, wenn Sie die Transformationsparameter nur überprüft haben. Wenn Sie auf Abbrechen klicken, werden keine Änderungen gespeichert.

  Klicken Sie auf OK, wenn Sie die Transformationsparameter bearbeitet haben. Die Änderungen werden gespeichert..


Die Resultate des Chi-Quadrat Tests ansehen

Überblick und weitere Informationen
Der Chi-Quadrat Test ist eine Bewertung des Netz-Referenzfaktors (RF), der Freiheitsgrade. Wenn der RF nahe bei 1,0 liegt, sind die Freiheitsgrade akzeptabel, und das Netz ist mathematisch geschlossen. In diesem Falle sollte im Feld Chi-Quadrat die Meldung BESTANDEN erscheinen.

So können Sie die Resultate des Chi-Quadrat Tests ansehen:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang wird angezeigt.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung. Das Feld Chi-Quadrat Test erscheint.

3.	Beenden Sie das HTML-Anzeigemodul, wenn Sie die Sitzung beendet haben.


Den Bedingungsstatus von Festpunkten im Netz ansehen

Der Status, der für Festpunkte in der Netzausgleichung festgehalten wurde (Zwangspunktstatus), kann jederzeit zwischen Ausgleichungen angesehen werden.

1.	Wählen Sie Ausgleichung / Punkte. Das Dialogfeld Punkte erscheint.

2.	Verwenden Sie die Bildlaufleiste, um die Festpunkte anzusehen.

Der Status, der für eine Festpunktkoordinate festgehalten wurde, ist aktiviert, wenn ein Häkchen im entsprechenden Kontrollkästchen erscheint und deaktiviert, wenn kein Häkchen angezeigt wird. Die entsprechende Koordinatenkomponente erscheint in der Spalte Fest bzw. bei Punkten mit Festpunktqualität werden die Klammern um den jeweiligen ID-Code entfernt.

3.	Klicken Sie auf Abbrechen. Es werden keine Änderungen im Projekt gespeichert.

HINWEIS: Die Koordinatenqualität kann ebenfalls im Eigenschaftsfenster angesehen werden. Wenn ein Punkt festgehalten wurde, wird er als festgehaltener Festpunkt angezeigt.


Die Freiheitsgrade ansehen

Überblick und weitere Informationen
Verwenden Sie die Statistik der Freiheitsgrade, um die im Netz enthaltene Redundanz anzusehen.

So können Sie den Wert für die Freiheitsgrade ansehen:

1.	Wählen Sie Berichte / Bericht Netzausgleichung, um den Bericht anzuzeigen. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang wird angezeigt.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Die Berichtabschnitt mit den Freiheitsgraden wird angezeigt.

Dieses Feld repräsentiert eine Reihe unabhängiger Ausgleichungsbeobachtungen, die zur Überbestimmung von Lösungen verwendet werden. Je größer der in diesem Feld angezeigte Wert ist, desto besser, vorausgesetzt alle Beobachtungen sind unabhängig. Weitere Informationen finden Sie unter Unabhängige Basislinien auswählen.

3.	Schließen Sie das HTML-Anzeigemodul, wenn Sie die Sitzung beendet haben.


Den Netz-Referenzfaktor ansehen

Überblick und weitere Informationen
Dieser Wert gibt an, inwieweit die vor der Ausgleichung geschätzten a-priori Fehler mit den nach der Ausgleichung bestimmten a-posteriori Fehlern übereinstimmen. Mit anderen Worten: der Netz-Referenzfaktor gibt an, in welchem Umfang die Zufallsfehler mit den für diese Beobachtung geschätzten Fehlern übereinstimmen.

So können Sie den Wert für den Netz-Referenzfaktor ansehen:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang wird angezeigt.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Der Berichtabschnitt mit dem Feld Netz-Referenzfaktor wird angezeigt.

3.	Schließen Sie das HTML-Anzeigemodul, wenn Sie die Sitzung beendet haben (normalerweise Datei/Beenden).


Den Netzausgleichungsbericht ansehen

 Überblick und weitere Informationen

Sehen Sie sich den Netzausgleichungsbericht an, nachdem Sie eine Ausgleichung beendet haben.

1.	Wählen Sie Berichte / Bericht Netzausgleichung, um den Bericht anzuzeigen. Der Netzausgleichungsbericht wird im voreingestellten HTML-Anzeigemodul Ihres Computers angezeigt.

2.	Beachten Sie folgende Richtlinien beim Ansehen der Netzausgleichungsresultate:

  Klicken Sie auf die Hyperlinks im Inhaltsverzeichnis auf der linken Seite des Bildschirms, um zu einem bestimmten Berichtsabschnitt zu navigieren

  Verwenden Sie den entsprechenden Befehl des HTML-Anzeigemoduls, um zum Seitenanfang zurückzukehren. In der Regel wird dafür die Schaltfläche Zurück verwendet.

  Verwenden Sie die Tasten Bild-auf und Bild-ab, die Bildlaufleisten oder andere im Anzeigemodul verfügbare Befehle, um durch den Bericht zu navigieren.

  Drücken Sie Alt+Tab, um zwischen der Trimble Geomatics Office Software und dem HTML-Anzeigemodul zu wechseln. Jedesmal, wenn Alt+Tab gedrückt wird, bewegen Sie sich zum nächsten geöffneten Fenster.

  Da das HTML-Anzeigemodul eine eigenständige Anwendung ist, können Sie sie auf Symbolgröße verkleinern und zur Trimble Geomatics Office Software zurückkehren, um nach der Bewertung des Ausgleichungsberichts Änderungen an der Ausgleichung vorzunehmen. Sie können dann das HTML-Anzeigefenster wieder maximieren und weitere Bewertungen vornehmen. Dieser Vorgang kann für die aktuelle Berichtauswertung beliebig oft wiederholt werden.

  Verwenden Sie die Befehle des HTML-Anzeigemoduls, wenn Sie Ihren Bericht zur Auswertung drucken möchten (normalerweise Datei / Drucken).

  Berichte können zu Archivierungszwecken in eine Datei geschrieben werden oder später in eine Datei gedruckt werden.

  Wenn Sie über eine Kopie von Adobe® Acrobat® verfügen, können Sie Berichte in eine Datei drucken und dann eine PDF-Datei erstellen. Sie erhalten so eine abrufbare Berichtsdokumentation mit Hyperlinks.

  Berichte können mit dem entsprechenden HTML-Befehl auch per E-mail versandt werden. Bei Echtzeit-Anwendungen kann dies von Vorteil sein, um Berichte an Beobachter im Feld zu schicken. Es kann darüber hinaus hilfreich sein, um Berichtsdaten vom Feld in eine Bürozentrale zu senden.

3.	Schließen Sie das HTML-Anzeigemodul.


Beobachtungen ansehen, die für die Ausgleichung ausgewählt wurden

Überblick und weitere Informationen
Beobachtungen können zwischen Ausgleichungen angesehen werden.

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid. Die gewählte Beobachtungsliste erscheint.

3.	Verwenden Sie die Bildlaufleiste, um durch die Liste zu navigieren.

4.	Klicken Sie auf Abbrechen, wenn Sie die Beobachtungen angesehen haben.

Es werden keine Änderungen im Projekt gespeichert.


Beobachtungen in Transformationsgruppen ansehen

Überblick und weitere Informationen
Beobachtungen in Transformationsgruppen können jederzeit zwischen Ausgleichungen angesehen werden.

So können Sie Transformationsgruppen-Beobachtungen ansehen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Rollen Sie durch die Liste, und wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

Im Feld Gruppenname wird der Name angezeigt, der der Gruppe zugeordnet wurde. Sehen Sie sich die in der Gruppe enthaltenen Beobachtungen in der Liste Gruppenbeobachtungen und die verfügbaren Projektbeobachtungen in der Liste Verfügbare Beobachtungen an.

5.	Klicken Sie auf Abbrechen, wenn Sie die Gruppenbeobachtungen angesehen haben.

Es werden keine Änderungen im Projekt gespeichert.


Transformationsgruppen ansehen

Überblick und weitere Informationen
Transformationsgruppen können jederzeit zwischen Ausgleichungen angesehen werden.

So können Sie Transformationsgruppen ansehen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Rollen Sie durch die Liste zur gewünschten Gruppe.

4.	Wählen Sie die Gruppe.

5.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

Im Feld Gruppenname wird der Name angezeigt, der der Gruppe zugeordnet wurde. Sehen Sie sich die in der Gruppe enthaltenen Beobachtungen in der Liste Gruppenbeobachtungen und die verfügbaren Projektbeobachtungen in der Liste Verfügbare Beobachtungen an. Die Liste Transformationsparameter in der linken oberen Ecke enthält die aktuellen Transformationsparameter-Einstellungen.

TIP: Sie können die Transformationsparameter auch im Register Ausgleichung ansehen, indem Sie im Dialogfeld Projekteigenschaften im Register Koordinatensystem auf Details klicken.

6.	Klicken Sie auf Abbrechen, wenn Sie sich die Gruppe angesehen haben.

Es werden keine Änderungen im Projekt gespeichert.


Transformationsparameter ansehen

Überblick und weitere Informationen
Transformationsparameter können jederzeit zwischen Ausgleichungen angesehen werden.

TIP: Sie können die Transformationsparameter auch im Register Ausgleichung ansehen, indem Sie im Dialogfeld Projekteigenschaften im Register Koordinatensystem auf Details klicken.

So können Sie Transformationsparameter ansehen:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die gewünschte Transformationsgruppe aus der Liste.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint.

Die Transformationsparameterliste befindet sich in der linken oberen Ecke des Dialogfelds unterhalb des Felds Gruppenname.

Weitere Informationen über individuelle Parameter finden Sie unter folgenden Themen:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet.

Weitere Informationen finden Sie unter Transformationsparameter.


Beobachtungen in Varianzgruppen ansehen

Überblick und weitere Informationen
Führen Sie die nachfolgenden Schritte aus, um eine Varianzgruppe mit Geoid-, terrestrischen oder GPS-Beobachtungen anzusehen.

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register Geoid oder GPS.

3.	Wählen Sie eine Varianzgruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Varianzgruppe bearbeiten mit der Liste der Beobachtungen erscheint.

5.	Verwenden Sie die Bildlaufleiste, um durch die Liste Beobachtungen zu rollen.

6.	Klicken Sie auf Abbrechen. Es werden keine Änderungen im Projekt gespeichert.


Eine Basislinie in eine Netzausgleichung einschließen

Überblick und weitere Informationen
Wenn eine Basislinie aus irgendeinem Grund aus einer Netzausgleichung entfernt wurde, können die Basislinien-Eigenschaften so geändert werden, daß die Basislinie erneut in zukünftigen Netzausgleichungen enthalten ist.

HINWEIS: Die Basislinie muß aktiviert sein, damit sie in einer Netzausgleichung verwendet werden kann.

So schließen Sie eine Basislinie in zukünftige Netzausgleichungen ein:

1.	Doppelklicken Sie auf die Basislinie. Das Eigenschaftsfenster erscheint.

2.	Öffnen Sie die Seite Zusammenfassung im Eigenschaftsfenster.

3.	Wählen Sie das Kontrollkästchen Bei der Netzausgleichung verwenden, um die Basislinie in zukünftige Netzausgleichungen einzuschließen.

4.	Klicken Sie auf OK, nachdem Sie die Änderungen durchgeführt haben.


Eine Beobachtung aus einer Netzausgleichung entfernen

Überblick und weitere Informationen
Sie können eine Beobachtung aus zukünftigen Netzausgleichungen entfernen, indem Sie ihre Eigenschaften ändern.

So entfernen Sie Beobachtungen:

1.	Doppelklicken Sie auf die Beobachtung. Das Eigenschaftsfenter erscheint.

2.	Klicken Sie auf die Schaltfläche Seite Zusammenfassung [image]. Wenn das Kontrollkästchen Bei der Netzausgleichung verwenden auf der Seite Zusammenfassung gewählt ist, wird die Basislinie in zukünftige Netzausgleichungen eingeschlossen.

3.	Deaktivieren Sie dieses Kontrollkästchen. Die Beobachtung wird aus zukünftigen Netzausgleichungen entfernt.

4.	Klicken Sie auf OK, wenn Sie die Änderungen durchgeführt haben.

HINWEIS: Sie können eine Beobachtung auch im Dialogfeld Beobachtungen aus einer Netzausgleichung entfernen.


Beobachtungen aus einer Netzausgleichung ausschließen

Überblick und weitere Informationen
Alle Beobachtungen, die ausgeglichen werden können, werden beim Importieren für die Ausgleichung markiert. Individuelle Beobachtungen können jedoch im Dialogfeld Beobachtungen aus einer Ausgleichung ausgeschlossen werden. Eine ausgeschlossene Beobachtung wird nicht aus dem Projekt gelöscht.

So schließen Sie Beobachtungen aus:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Wählen Sie in der Liste Beobachtungen die gewünschte Beobachtung.

TIP: Sie können die Liste filtern, um Beobachtungstypen zeitweise auszublenden, und die Liste übersichtlicher zu gestalten. Kürzere Listen erleichtern das Auffinden von Beobachtungen.

4.	Vergewissern Sie sich, daß das Kontrollkästchen in der Spalte ‘Verwenden‘ deaktiviert ist.

5.	Klicken Sie auf OK, wenn Sie Beobachtungen ausgeschlossen haben, um die Änderungen im Projekt zu speichern.

HINWEIS: Beobachtungen können ebenfalls aus einer Ausgleichung ausgeschlossen werden, indem das Kontrollkästchen Bei der Netzausgleichung verwenden auf der Seite Zusammenfassung im Eigenschaftsfenster deaktiviert wird.

Beobachtungen, die aus einer Ausgleichung ausgeschlossen wurden, können erneut in die Ausgleichung eingeschlossen werden.

HINWEIS: Beobachtungen können auch deaktiviert und erneut aktiviert werden. Weitere Informationen finden Sie unter Beobachtungen deaktivieren und Deaktivierte Beobachtungen erneut aktivieren.


Deaktivierte Beobachtungen für Ausgleichungen und Neuberechnungen erneut aktivieren

Überblick und weitere Informationen
Beobachtungen, die im Dialogfeld Beobachtungen oder im Graphikfenster deaktiviert wurden, können erneut aktiviert werden. Wenn eine Beobachtung erneut aktiviert wird, erscheint sie im Dialogfeld Beobachtungen und wird für zukünftige Netzausgleichungen und Neuberechnungen verwendet.

HINWEIS: Das erneute Aktivieren und das Einschließen einer Beobachtung sind zwei verschiedene Vorgänge. Ausgeschlossene Beobachtungen können erneut in zukünftige Netzausgleichungen und Neuberechnungen eingeschlossen werden, indem das Kontrollkästchen ‘Verwenden‘ für die entsprechende Beobachtung im Dialogfeld Beobachtungen oder das Kontrollkästchen Bei der Netzausgleichung verwenden auf der Seite Zusammenfassung im Eigenschaftsfenster aktiviert wird. Weitere Informationen finden Sie unter Beobachtungen in eine Netzausgleichung einschließen.

So aktivieren Sie Beobachtungen im Graphikfenster erneut:

1.	Doppelklicken Sie auf die Beobachtung. Deaktivierte Beobachtungen werden im Graphikfenster rot dargestellt.

2.	Das Eigenschaftsfenster erscheint.

3.	Klicken Sie auf die Schaltfläche Seite Zusammenfassung [image], um die Seite Zusammenfassung anzuzeigen.

4.	Wählen Sie in der Statusliste die Option Aktiviert.

5.	Vergewissern Sie sich, daß das Kontrollkästchen Bei der Netzausgleichung verwenden gewählt ist.

6.	Die Beobachtung ist wieder aktiviert und wird für zukünftige Netzausgleichungen und Neuberechnungen verwendet. Sie ist im Graphikfenster nicht länger rot markiert.

HINWEIS: Weitere Informationen über das Ein- und Ausschließen von Beobachtungen finden Sie unter Beobachtungen einschließen und Beobachtungen ausschließen.


Unterschiedliche Beobachtungstypen in einer Netzausgleichung kombinieren

Sie können GPS-, terrestrische und Geoid-Beobachtungen in einer Netzausgleichung kombinieren, um einen Satz ausgeglichener Koordinaten zu erstellen.

Dazu müssen terrestrische Beobachtungen mit dem GPS-Netz verknüpft werden, andernfalls könnte eine Fehlermeldung erscheinen, wenn Sie eine Netzausgleichung durchführen. Messen Sie dazu Winkel und Strecken an gemeinsamen Punkten im GPS-Netz. Verwenden Sie mindestens zwei gemeinsame Punkte, die eine Verbindung zwischen den beiden Datensätzen herstellen können (Festpunkte oder Punkte, die in GPS- und terrestrischen Datensätzen beobachtet wurden). Dadurch wird verhindert, daß ein terrestrischer Polygonzug nur von einem Punkt einer GPS-Beobachtung abhängt.

Prüfen Sie jeden Beobachtungssatz, bevor Sie eine vollständig bedingte Netzausgleichung durchführen. Auf diese Weise können Sie Fehler schnell erkennen. Sie müssen darüber hinaus getrennte minimal bedingte Netzausgleichungen für GPS- und terrestrische Beobachtungen durchführen.

Die empfohlene Vorgehensweise beim Kombinieren von Beobachtungen in Netzausgleichungen enthält mehrere grundlegende Schritte. Der Arbeitsablauf ist in den nachfolgenden Abschnitten kurz beschrieben.

1. 	Die Daten importieren

a.	Wenn Festpunkte mit Ihrem Projekt verknüpft sind, importieren Sie diese Punkte zuerst in das Trimble Geomatics Office Projekt. Dadurch wird sichergestellt, daß diese Festpunktkoordinaten als Startpunkte bei der Neuberechnung verwendet werden. Weitere Informationen finden Sie unter Neuberechnung und Warum homogene Koordinaten für eine Netzausgleichung erforderlich sind.

b. 	Importieren Sie alle anderen Datensätze in Ihr Projekt. Überprüfen Sie alle Warnkennzeichnungen.

HINWEIS: Wenn Sie Daten importieren, und die Option Doppelte Punkte immer kombinieren im Dialogfeld Optionen doppelte Punkte nicht gewählt ist, müssen Sie doppelte Punkte kombinieren.

2.	Die GPS-Daten vorbereiten

Führen Sie die nachfolgenden Schritte aus, um eine minimal bedingte Ausgleichung für die GPS-Beobachtungen durchzuführen:

a.	Wählen Sie die GPS-Daten im Graphikfenster.

b.	Verarbeiten Sie die GPS-Daten.

c.	Führen Sie GPS-Schleifenschlüsse durch, und sehen Sie sich den Schleifenschlußbericht an, um sicherzustellen, daß die GPS-Beobachtungen für die Ausgleichung geeignet sind.

d.	Entfernen Sie alle Warnkennzeichnungen für Beobachtungen, deren Werte außerhalb der Toleranz liegen. Warnkennzeichnungen können durch falsche Festpunktkoordinaten, schlechte Antennenhöhen oder falsche Punktbenennung hervorgerufen werden.

e.	Wählen Sie unabhängige GPS-Basislinien.

f.	Wählen Sie das WGS-84 Datum.

g.	Wählen Sie den Ausgleichungsstil. Ändern Sie, falls erforderlich, die Ausgleichungsstil-Einstellungen.

h.	Wählen Sie im Register GPS im Dialogfeld Beobachtungen die Beobachtungen, die Sie in die Ausgleichung einschließen möchten.

TIP: Verwenden Sie die Schaltfläche Filter im Dialogfeld Beobachtungen, um Beobachtungstypen zu filtern.

i.	Definieren Sie Beobachtungsgruppen (Varianz- und/oder Transformationsgruppen) für die Daten, falls erforderlich.

j.	Halten Sie einen Festpunkt im Dialogfeld Punkte fest. Dies ist optional.

k	Legen Sie die Gewichtungsstrategie fest (stellen Sie den Beobachtungstyp für die erste Ausgleichung auf Alle Beobachtungen und den Skalartyp auf Voreinstellung ein).

l.	Führen Sie eine minimal bedingte Ausgleichung durch.

m	Sehen Sie sich die Ausgleichungsdetails im Netzausgleichungsbericht an.

n.	Stellen Sie den Skalartyp, falls erforderlich, auf Alternativ ein, führen Sie weitere Ausgleichungen durch und überprüfen Sie den Netzausgleichungsbericht. Führen Sie dies so lange fort, bis der Chi-Quadrat Test bestanden ist, und Sie mit den Ausgleichungsresultaten zufrieden sind.

HINWEIS: Wenn Sie den Skalartyp Automatisch im Dialogfeld Gewichtungsstrategien wählen, werden die Ausgleichungsiterationen durchgeführt, bis der Chi-Quadrat Test bestanden ist.

o.	Wenn Sie den Skalartyp Alternativ gewählt haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien nach der letzten Ausgleichungsiteration.

p.	Wenn Sie eine GPS-Kalibrierung durchführen möchten, speichern Sie Kalibrierungskoordinaten. WGS-84 Koordinaten werden gespeichert.

Sie können nun eine vollständig bedingte Ausgleichung für die GPS-Beobachtungen durchführen.

3.  Die terrestrischen Daten vorbereiten

Führen Sie die nachfolgenden Schritte aus, um eine minimal bedingte Ausgleichung für die terrestrischen Daten durchzuführen:

a.	Wählen Sie die terrestrischen Beobachtungen im Graphikfenster.

TIP: Sie können Ansichtsfilter verwenden, um lediglich die terrestrischen Beobachtungen anzuzeigen.

b.	Wählen Sie das Projektdatum.

c.	Wählen Sie im Register Terrestrisch im Dialogfeld Beobachtungen die Beobachtungen, die in die Ausgleichung eingeschlossen werden sollen.

HINWEIS: Wenn die terrestrischen Daten keinen geschlossenen Polygonzug enthalten (d.h. wenn die terrestrischen Beobachtungen vom GPS-Beobachtungsnetz abhängen), müssen Sie ebenfalls Geoid-Beobachtungen laden, um sicherzustellen, daß die GPS- und terrestrischen Beobachtungen mit Hilfe des Geoids miteinander verbunden werden können. Wenn Sie in diesem Stadium Geoid-Daten in die terrestrische Ausgleichung einschließen, können Sie den nachstehenden Schritt 4 überspringen.

d.	Definieren Sie Beobachtungsgruppen (Varianz- und/oder Transformationsgruppen) für die Daten, falls erforderlich.

e.	Legen Sie die Gewichtungsstrategie fest (stellen Sie den Beobachtungstyp für die erste Ausgleichung auf Alle Beobachtungen und den Skalartyp auf Voreinstellung ein).

f.	Halten Sie im Dialogfeld Punkte einen Punkt fest.

HINWEIS: Damit eine kombinierte Ausgleichung durchgeführt werden kann, sollten Sie einen Punkt festhalten, der sowohl im GPS- als auch im terrestrischen Netz vorhanden ist.

g.	Führen Sie eine minimal bedingte Ausgleichung durch.

h	Sehen Sie sich die Ausgleichungsdetails im Netzausgleichungsbericht an.

i.	Stellen Sie den Skalartyp, falls erforderlich, auf Alternativ ein, führen Sie eine weitere Ausgleichung durch, und überprüfen Sie den Netzausgleichungsbericht. Führen Sie dies so lange fort, bis der Chi-Quadrat Test bestanden ist und Sie mit den Ausgleichungsresultaten zufrieden sind.

HINWEIS: Wenn Sie den Skalartyp Automatisch im Dialogfeld Gewichtungsstrategien wählen, werden die Ausgleichungsiterationen durchgeführt, bis der Chi-Quadrat Test bestanden ist.

j.	Wenn Sie den Skalartyp Alternativ verwendet haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien.

Sie können nun eine vollständig bedingte Ausgleichung für die terrestrischen Beobachtungen durchführen.

4.	Geoid-Beobachtungen in die Ausgleichung einschließen

Geoid-Fehler werden bei einer bedingten Beobachtungsausgleichung skaliert. Führen Sie die nachfolgenden Schritte aus, um eine vertikal bedingte Ausgleichung für die Geoid-Daten durchzuführen:

a.	Vergewissern Sie sich, daß ein Geoid-Modell für das Projekt gewählt wurde. Klicken Sie dazu im Register Koordinatensystem des Dialogfelds Projekteigenschaften auf die Schaltfläche Details. Das Dialogfeld Koordinatensystem-Details wird angezeigt.

b. 	Wählen Sie im Dialogfeld Beobachtungen das Register Geoid, und laden Sie die Geoid-Beobachtungen.

c. 	Legen Sie die Geoid-Gewichtungsstrategie fest. Stellen Sie den Skalartyp für die erste Ausgleichung auf Voreinstellung ein.

d.	Halten Sie im Dialogfeld Punkte orthometrische (und/oder ellpsoidische) Höhen fest. Sie sollten mindestens 3 Werte festhalten.

e.	Führen Sie eine Ausgleichung durch.

f.	Sehen Sie sich die Ausgleichungsdetails im Netzausgleichungsbericht an.

g.	Stellen Sie den Skalartyp, falls erforderlich, auf Alternativ ein, führen Sie eine weitere Ausgleichung durch, und überprüfen Sie den Netzausgleichungsbericht. Führen Sie dies so lange fort, bis der Chi-Quadrat Test bestanden ist, und Sie mit den Ausgleichungsresultaten zufrieden sind.

h.	Wenn Sie den Skalartyp Alternativ verwendet haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien.

5.	Die vollständig bedingte Ausgleichung durchführen

Nachdem Sie den Skalarwert für die Fehlerskalierung in der minimal bedingten Ausgleichung gesperrt haben, können Sie eine vollständig bedingte Ausgleichung durchführen.

So führen Sie dies durch:

a.	Vergewissern Sie sich, daß das Projektdatum noch gewählt ist.

b.	Halten Sie im Dialogfeld Punkte Festpunkte fest.

HINWEIS: Damit eine kombinierte Ausgleichung durchgeführt werden kann, sollten Sie mindestens zwei GPS-Punkte festhalten. Diese Punkte sollten sowohl im GPS- als auch im terrestrischen Netz enthalten sein.

c.	Führen Sie eine Ausgleichung durch.

d.	Sehen Sie sich die Ausgleichungsresultate im Netzausgleichungsbericht an.

e.	Führen Sie, falls erforderlich, weitere Ausgleichungen durch, bis Sie mit den Ausgleichungsresultaten zufrieden sind.

TIP: Wenn die Ausgleichung nicht konvergiert, der Chi-Quadrat Test nicht bestanden oder der Referenzfaktor nicht akzeptabel ist, könnte es Probleme mit den Festpunktkoordinaten geben. Heben Sie den Status der einzelnen bedingten Punkte jeweils nacheinander im Dialogfeld Punkte auf, und führen Sie die vollständig bedingte Ausgleichung erneut durch, bis Sie den schlechten Punkt gefunden haben. Weitere Informationen zur Problembehebung finden Sie im Network Adjustment Software-Benutzerhandbuch.


Eine Netzausgleichung für GPS-Beobachtungen durchführen

Die nachfolgenden Abschnitte enthalten eine kurze Zusammenfassung des erforderlichen Arbeitsablaufs für die Ausgleichung von GPS-Beobachtungen in der Trimble Geomatics Office Software:

1. 	Festpunktdaten importieren

a.	Wenn Festpunkte mit Ihrem Projekt verknüpft sind, importieren Sie diese Punkte zuerst in das Trimble Geomatics Office Projekt. Dadurch wird sichergestellt, daß diese Festpunktkoordinaten als Startpunkte bei der Neuberechnung verwendet werden. Weitere Informationen finden Sie unter Neuberechnung und Warum homogene Koordinaten für eine Netzausgleichung erforderlich sind.

b. 	Importieren Sie alle anderen Datensätze in Ihr Projekt, und überprüfen Sie sie. Überprüfen Sie alle Warnkennzeichnungen.

HINWEIS: Wenn Sie Daten importieren und die Option Doppelte Punkte immer kombinieren im Dialogfeld Optionen doppelte Punkte nicht gewählt ist, müssen Sie doppelte Punkte kombinieren.

2.	Die GPS-Daten vorbereiten

a.	Verarbeiten Sie die GPS-Daten.

b.	Führen Sie GPS-Schleifenschlüsse durch, und sehen Sie sich den Schleifenschlußbericht an, um sicherzustellen, daß die GPS-Beobachtungen für die Ausgleichung geeignet sind.

c.	Entfernen Sie alle Warnkennzeichnungen für Beobachtungen, deren Werte außerhalb der Toleranz liegen. Warnkennzeichnungen können durch falsche Festpunktkoordinaten, schlechte Antennenhöhen oder falsche Punktbenennung hervorgerufen werden.

d.	Wählen Sie unabhängige GPS-Basislinien.

e.	Wählen Sie das WGS-84 Datum.

f.	Wählen Sie den Ausgleichungsstil. Ändern Sie, falls erforderlich, die Ausgleichungsstil-Einstellungen.

g.	Wählen Sie im Register GPS im Dialogfeld Beobachtungen die Beobachtungen, die Sie in die Ausgleichung einschließen möchten.

TIP: Verwenden Sie die Schaltfläche Filter im Dialogfeld Beobachtungen, um Beobachtungstypen zu filtern.

h.	Definieren Sie Beobachtungsgruppen (Varianz- und/oder Transformationsgruppen) für die Daten, falls erforderlich.

i.	Halten Sie einen Festpunkt im Dialogfeld Punkte fest. Dies ist optional.

j	Legen Sie die Gewichtungsstrategie fest (stellen Sie den Beobachtungstyp für die erste Ausgleichung auf Alle Beobachtungen und den Skalartyp auf Voreinstellung ein).

k.	Führen Sie eine minimal bedingte Ausgleichung durch.

l	Sehen Sie sich die Ausgleichungsdetails im Netzausgleichungsbericht  an.

m.	Stellen Sie den Skalartyp, falls erforderlich, auf Alternativ ein, führen Sie weitere Ausgleichungen durch, und überprüfen Sie den Netzausgleichungsbericht. Führen Sie dies so lange fort, bis der Chi-Quadrat Test bestanden ist, und Sie mit den Ausgleichungsresultaten zufrieden sind.

HINWEIS: Wenn Sie den Skalartyp Automatisch im Dialogfeld Gewichtungsstrategien wählen, werden die Ausgleichungsiterationen durchgeführt, bis der Chi-Quadrat Test bestanden ist.

n.	Wenn Sie den Skalartyp Alternativ gewählt haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien nach der letzten Ausgleichungsiteration.

o.	Wenn Sie eine GPS-Kalibrierung durchführen möchten, speichern Sie Kalibrierungskoordinaten. WGS-84 Koordinaten werden gespeichert.

Sie können nun eine vollständig bedingte Ausgleichung für die GPS-Beobachtungen durchführen.

3.	Geoid-Beobachtungen in die Ausgleichung einschließen

Geoid-Fehler werden bei einer bedingten Beobachtungsausgleichung skaliert. Führen Sie die nachfolgenden Schritte aus, um eine vertikal bedingte Ausgleichung für die Geoid-Daten durchzuführen:

a.	Vergewissern Sie sich, daß ein Geoid-Modell für das Projekt gewählt wurde. Klicken Sie dazu im Register Koordinatensystem des Dialogfelds Projekteigenschaften auf die Schaltfläche Details. Das Dialogfeld Koordinatensystem-Details wird angezeigt.

b. 	Wählen Sie im Dialogfeld Beobachtungen das Register Geoid, und laden Sie die Geoid-Beobachtungen.

c. 	Legen Sie die Geoid-Gewichtungsstrategie fest. Stellen Sie den Skalartyp für die erste Ausgleichung auf Voreinstellung ein.

d.	Halten Sie im Dialogfeld Punkte orthometrische (und/oder ellpsoidische) Höhen fest. Sie sollten mindestens 3 Werte festhalten.

e.	Führen Sie eine Ausgleichung durch.

f.	Sehen Sie sich die Ausgleichungsdetails im Netzausgleichungsbericht an.

g.	Stellen Sie den Skalartyp, falls erforderlich, auf Alternativ ein, führen Sie eine weitere Ausgleichung durch, und überprüfen Sie den Netzausgleichungsbericht. Führen Sie dies so lange fort, bis der Chi-Quadrat Test bestanden ist und Sie mit den Ausgleichungsresultaten zufrieden sind.

h.	Wenn Sie den Skalartyp Alternativ verwendet haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien.

4.	Die vollständig bedingte Ausgleichung durchführen

Nachdem Sie den Skalarwert für die Fehlerskalierung in der minimal bedingten Ausgleichung gesperrt haben, können Sie eine vollständig bedingte Ausgleichung durchführen.

So führen Sie dies durch:

a.	Vergewissern Sie sich, daß das Projektdatum noch gewählt ist.

b.	Halten Sie im Dialogfeld Punkte Festpunkte fest.

c.	Führen Sie eine Ausgleichung durch.

d.	Sehen Sie sich die Ausgleichungsresultate im Netzausgleichungsbericht an.

e.	Führen Sie, falls erforderlich, weitere Ausgleichungen durch, bis Sie mit den Ausgleichungsresultaten zufrieden sind.

TIP: Wenn die Ausgleichung nicht konvergiert, der Chi-Quadrat Test nicht bestanden oder der Referenzfaktor nicht akzeptabel ist, könnte es Probleme mit den Festpunktkoordinaten geben. Heben Sie den Status der einzelnen bedingten Punkte jeweils nacheinander im Dialogfeld Punkte auf, und führen Sie die vollständig bedingte Ausgleichung erneut durch, bis Sie den schlechten Punkt gefunden haben. Weitere Informationen zur Problembehebung finden Sie im Network Adjustment Software-Benutzerhandbuch.


Eine Netzausgleichung für terrestrische Beobachtungen durchführen

Die nachfolgenden Abschnitte enthalten eine kurze Zusammenfassung des erforderlichen Arbeitsablaufs für die Ausgleichung terrestrischer Beobachtungen in der Trimble Geomatics Office Software:

HINWEIS: Wenn Sie eine Netzausgleichung mit Daten durchführen möchten, die von der Trimble Survey Controller Software übertragen wurden, vergewissern Sie sich, daß Sie bei der Vermessung eine Druck-, Temperatur-, Krümmungs- und Refraktionskorrektur im Survey Controller-Vermessungsstil eingeben. Eine Projektion muß ebenfalls für das Projekt definiert sein.

1. 	Festpunktdaten importieren

a.	Wenn Festpunkte mit Ihrem Projekt verknüpft sind, importieren Sie diese Punkte zuerst in das Trimble Geomatics Office Projekt. Dadurch wird sichergestellt, daß diese Festpunktkoordinaten als Startpunkte bei der Neuberechnung verwendet werden. Weitere Informationen finden Sie unter Neuberechnung und Warum homogene Koordinaten für eine Netzausgleichung erforderlich sind.

b. 	Importieren Sie alle anderen Datensätze in Ihr Projekt. Überprüfen Sie alle Warnkennzeichnungen.

HINWEIS: Wenn Sie Daten importieren, und die Option Doppelte Punkte immer kombinieren im Dialogfeld Optionen doppelte Punkte nicht gewählt ist, müssen Sie doppelte Punkte kombinieren.

2.  Die terrestrischen Daten vorbereiten

Führen Sie die nachfolgenden Schritte aus, um eine minimal bedingte Ausgleichung für die terrestrischen Daten durchzuführen:

a.	Importieren und überprüfen Sie die terrestrischen Daten (überprüfen Sie alle Warnkennzeichnungen, die erzeugt wurden).

b.	Wenn doppelte Punkte im Projekt vorhanden sind, und die Option Doppelte Punkte immer kombinieren im Dialogfeld Optionen doppelte Punkte nicht gewählt ist, müssen Sie doppelte Punkte kombinieren.

c.	Wählen Sie das Projektdatum.

d.	Wählen Sie im Register Terrestrisch im Dialogfeld Beobachtungen die  Beobachtungen, die in die Ausgleichung eingeschlossen werden sollen.

e.	Definieren Sie Beobachtungsgruppen (Varianz- und/oder Transformationsgruppen) für die Daten, falls erforderlich.

f.	Legen Sie die Gewichtungsstrategie fest (stellen Sie den Beobachtungstyp für die erste Ausgleichung auf Alle Beobachtungen und den Skalartyp auf Voreinstellung ein).

g.	Führen Sie eine minimal bedingte Ausgleichung durch.

h.	Sehen Sie sich die Ausgleichungsdetails im Netzausgleichungsbericht an.

i.	Stellen Sie den Skalartyp, falls erforderlich, auf Alternativ ein, führen Sie eine weitere Ausgleichung durch. Führen Sie dies so lange fort, bis Sie mit den Ausgleichungsresultaten zufrieden sind.

HINWEIS: Wenn Sie den Skalartyp Automatisch im Dialogfeld Gewichtungsstrategien wählen, werden die Ausgleichungsiterationen durchgeführt, bis der Chi-Quadrat Test bestanden ist.

j.	Wenn Sie den Skalartyp Alternativ verwendet haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien.

Sie können nun eine vollständig bedingte Ausgleichung für die terrestrischen Beobachtungen durchführen.

3.	Die vollständig bedingte Ausgleichung durchführen

Nachdem Sie den Skalarwert für die Fehlerskalierung in der minimal bedingten Ausgleichung gesperrt haben, können Sie eine vollständig bedingte Ausgleichung durchführen.

So führen Sie dies durch:

a.	Vergewissern Sie sich, daß das Projektdatum noch gewählt ist.

b.	Halten Sie im Dialogfeld Punkte Festpunkte fest.

c.	Führen Sie eine Ausgleichung durch.

d.	Sehen Sie sich die Ausgleichungsresultate im Netzausgleichungsbericht an.

f.	Führen Sie, falls erforderlich, weitere Ausgleichungen durch, bis Sie mit den Ausgleichungsresultaten zufrieden sind.

TIP: Wenn die Ausgleichung nicht konvergiert, der Chi-Quadrat Test nicht bestanden oder der Referenzfaktor nicht akzeptabel ist, könnte es Probleme mit den Festpunktkoordinaten geben. Heben Sie den Status der einzelnen bedingten Punkte jeweils nacheinander im Dialogfeld Punkte auf, und führen Sie die vollständig bedingte Ausgleichung erneut durch, bis Sie den schlechten Punkt gefunden haben. Weitere Informationen zur Problembehebung finden Sie im Network Adjustment Software-Benutzerhandbuch.


Nivellierbeobachtungen ausgleichen

Die nachfolgenden Abschnitte enthalten eine kurze Zusammenfassung des erforderlichen Arbeitsablaufs für die Ausgleichung von Nivellierbeobachtungen in der Trimble Geomatics Office Software:

1.  Nivellierbeobachtungen importieren

So führen Sie dies durch:

a.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

b.	Wählen Sie im Register Vermessung die Option Digitale Nivellier-Dateien (*.dat, *.raw). Das Dialogfeld Öffnen erscheint.

c.	Wählen Sie die digitale Nivellierdatei, die Sie importieren möchten. Das Dialogfeld Digitales Nivellier importieren erscheint. Verwenden Sie das Dialogfeld, um die Nivellierbeobachtungen zu überprüfen.

d.	Klicken Sie auf OK.

Die digitale Nivellierdatei wird importiert.

HINWEIS: Sie können auch Höhenunterschiede manuell in das Projekt importieren, indem Sie das Trimble Datenaustauschformat verwenden.

HINWEIS: Wählen Sie Berichte / Nivellier-Berichte, um die Nivellierinformationen im Nivellier-Bericht anzusehen.

2.  Die Nivellierbeobachtungen ansehen

Wenn digitale Nivellierdaten importiert werden, sind in der Regel keine horizontalen Koordinaten mit den orthometrischen Höhen verknüpft, daher können Sie sie in der Vermessungsansicht nicht ansehen (es sei denn, es existieren bereits horizontale Koordinaten für den Punkt im Projekt und doppelte Punkte wurden kombiniert). Sie können die Nivellierbeobachtungen jedoch im Eigenschaftsfenster ansehen. So führen Sie dies durch:

a.	Wählen Sie Wählen / Alles.

b.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Bearbeiten / Eigenschaften.

  Drücken Sie Alt + Eingabe.

  Wählen Sie das Symbol Eigenschaften bearbeiten aus der Symbolleiste.

Sie können die Nivelilerbeobachtungen nun ansehen.

3.  Eine minimal bedingte Ausgleichung durchführen

Führen Sie die folgenden Schritte aus, um Nivellierbeobachtungen auszugleichen:

a.	Wählen Sie das Projektdatum.

b.	Wählen Sie den Netzausgleichungsstil.

c.	Wählen Sie im Dialogfeld Beobachtungen die Beobachtungen, die in die Netzausgleichung eingeschlossen werden sollen.

TIP: Verwenden Sie den Filter Höhenunt. im Dialogfeld Beobachtungen, um nur Beobachtungen mit Höhenunterschieden auszuwählen.

d.	Laden Sie im Register Geoid im Dialogfeld Beobachtungen Geoid-Beobachtungen.

e.	Definieren Sie im Register Terrestrisch im Dialogfeld Beobachtungen Beobachtungsgruppen (Varianz- und/oder Transformationsgruppen) für die Daten.

f.	Stellen Sie die terrestrische Gewichtungsstrategie ein. Wählen Sie dazu im Dialogfeld Gewichtungsstrategien das Register Terrestrisch. Wählen Sie dann in den Gruppen Skalare anwenden auf und Skalartyp die entsprechenden Optionen.

g.	Halten Sie im Dialogfeld Punkte einen Punkt fest.

HINWEIS: Dieser Punkt ist in der Regel der Standpunkt, für den Sie eine orthometrische Höhe im Dialogfeld Digitales Nivellier importieren festgelegt haben.

h.	Führen Sie eine minimal bedingte Ausgleichung durch.

i.	Sehen Sie sich die Ausgleichungsresultate im Netzausgleichungsbericht an.

j.	Führen Sie, falls erforderlich, weitere Ausgleichungen durch, bis Sie mit den Resultaten zufrieden sind.

k.	Wenn Sie den Skalartyp Alternativ verwendet haben, sperren Sie den Skalarwert im Dialogfeld Gewichtungsstrategien.

4. Eine vollständig bedingte Ausgleichung durchführen

a.	Vergewissern Sie sich, daß das Projektdatum noch gewählt ist.

b.	Halten Sie im Dialogfeld Punkte Festpunkte fest.

c.	Führen Sie eine vollständig bedingte Ausgleichung durch.

d.	Sehen Sie sich die Ausgleichungsresultate im Netzausgleichungsbericht an.

e.	Führen Sie, falls erforderlich, weitere Ausgleichungen durch, bis Sie mit den Resultaten zufrieden sind.

Nachdem die Ausgleichung durchgeführt wurde, wird ein Satz ausgeglichener Koordinaten für jeden Punkt in der Ausgleichung gespeichert. Sie können diese Koordinaten im Eigenschaftsfenster ansehen.


Den Skalartyp Automatisch verwenden

Im Dialogfeld Gewichtungsstrategien können Sie einen der folgenden Skalartypen auswählen:

  Voreinstellung

  Alternativ

  Benutzerdefiniert

  Automatisch

Wenn Sie mit einer Ausgleichung beginnen, wendet die Software für die Gewichtungsstrategie den Skalartyp Voreinstellung auf alle Beobachtungen an. Bei der Ausgleichung multipliziert der voreingestellte Skalar den a-priori Fehler mit einem Wert von 1,00. Die Fehlerschätzungen werden dadurch nicht verändert.

Wenn die geschätzten Beobachtungsfehler mit den tatsächlichen Fehlern übereinstimmen, sollte der Referenzfaktor im Netzausgleichungsbericht bei 1,00 liegen. Wenn dies nicht der Fall ist, müssen Sie den geschätzten Fehler skalieren, damit er mit dem tatsächlichen Fehler übereinstimmt. Es ist am einfachsten, dazu den Skalartyp Alternativ zu wählen. Beim alternativen Skalartyp wird der Referenzfaktor der aktuellen Ausgleichung mit dem Skalar der vorhergehenden Ausgleichung multipliziert, um den Skalar für die nächste Ausgleichung zu bestimmen. Dadurch liegt der Referenzfaktor näher bei 1,00. Der Skalartyp Alternativ wird so lange auf nachfolgende Ausgleichungsiterationen angewendet, bis der Chi-Quadrat Test bestanden ist.

Wenn Sie den Skalartyp Automatisch verwenden, wird der alternative Skalartyp automatisch ausgewählt. Das bedeutet, daß Ausgleichungen durchgeführt werden, bis der Chi-Quadrat Test bestanden ist. Wenn dies geschieht, ist der Skalarwert gesperrt.

HINWEIS: Wenn Sie den Skalartyp Automatisch wählen, gibt der Netzausgleichungsbericht an, daß der Skalartyp Alternativ gewählt wurde.

Grobe Fehler sollten entdeckt werden

Grobe Fehler in Datensätzen führen bei einer Netzausgleichung zu einer extremen Skalierung der anderen Beobachtungen (in derselben Gruppe). Bevor Sie also den Skalartyp Automatisch verwenden, sollten Sie sich vergewissern, daß alle groben Fehler entfernt wurden. Sie können die Daten auf grobe Fehler oder fehlerhafte Daten überprüfen, indem Sie eine Ausgleichung mit Hilfe des Skalartyps Voreinstellung durchführen, und danach die Resultate überprüfen.

HINWEIS: Warnkennzeichnungen weisen ebenfalls auf mögliche Fehler im Datensatz hin.

Überprüfen Sie die Ausgleichungsresultate eingehend, nachdem Sie den Skalartyp Automatisch verwendet haben. Beachten Sie vor allem die Ausgleichungshistogramme, um sicherzustellen, daß keine groben Fehler in den Beobachtungen enthalten sind.

ACHTUNG: Es ist nicht empfehlenswert den Skalartyp Automatisch zur gleichzeitigen Skalierung von GPS- und terrestrischen Beobachtungen zu verwenden.


Dialogfeld Punkte - Überblick
    Dialogfeld Punkte − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, um Punkte in der Ausgleichung anzusehen, zu bewerten und Bedingungen für die Punkte festzulegen (Zwangspunkte zu erstellen).

Die im Dialogfeld Punkte angezeigten Koordinaten sind die aktuellen Punktkoordinaten, die auf der Seite Zusammenfassung im Eigenschaftsfenster angezeigt werden. Nach einer Ausgleichung werden die ausgeglichenen Koordinatenwerte im Dialogfeld Punkte angezeigt.

HINWEIS: Wenn Bedingungen für einen Punkt existieren (ein Punkt im Dialogfeld Punkte festgehalten wurde), und es keine Koordinate mit Festpunktqualität gibt, wird eine Koordinate für den Punkte gespeichert.

So greifen Sie auf Dialogfeld Punkte zu:

  Wählen Sie Ausgleichung / Punkte.

Folgende Optionen sind verfügbar:

Ausgleichungsdatum

Das Ausgleichungsdatum wird rechts oberhalb der Liste Punkte angezeigt.

Punkte

Verwenden Sie diese Liste, um die Punkte anzusehen, die mit den Beobachtungen in der Netzausgleichung verbunden sind. Diese Liste enthält nicht alle Punkte im Projekt. Weitere Informationen über die Listenfelder finden Sie unter Punkte.

Festhalten

Verwenden Sie die Kontrollkästchen in dieser Gruppe, um die Bedingungen für die Koordinatenkomponenten einzelner in die Netzausgleichung enthaltener Punkte festzulegen. Weitere Informationen finden Sie unter Festhalten.

Koordinatenansicht

Die Ansicht bestimmt, welcher Koordinatentyp im Projekt gespeichert wird.

Gitter – Wählen Sie diese Option, um die Punkte als Koordinaten der Kartenprojektion anzuzeigen, die im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt wurde. Dies ist die voreingestellte Ansicht.

Örtlich – Wählen Sie diese Option, um Punkte als geographische Koordinaten des Projektdatums anzuzeigen, das im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt wurde.

WGS-84 – Wählen Sie diese Option, um Punkte als geographische Koordinaten in WGS-84 anzuzeigen.


    Punkte

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Diese Liste enthält Punkte, die mit den in der Netzausgleichung enthaltenen Beobachtungen verknüpft sind. Sie enthält jedoch nicht alle Punkte im Projekt.

Jede Reihe in der Liste enthält die Daten für einen Punkt. Wenn eine Koordinatenkomponente des Punktes bearbeitet wird, wird das Kontrollkästchen in der Gruppe Festhalten aktiviert. Wenn das Kontrollkästchen deaktiviert wird, wird die bearbeitete Koordinatenkomponente auf den ursprünglichen Wert vor der Bearbeitung zurückgesetzt.

TIP: Die Größe der Listenspalten kann geändert werden. Die Spalten können zu einer neuen Position in der Liste verschoben und in auf- oder absteigender Reihenfolge sortiert werden.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Punkt	Der Name, der dem Punkt in der Netzausgleichung zugeordnet wurde.
Hochwert oder Örtliche Breite oder WGS-84 Breite	Die Hochwert-Koordinate der gewählten Kartenprojektion des Projekts, die örtliche Breite des Projektpunkts oder die WGS-84 Breite.
Rechtswert oder Örtliche Länge oder WGS-84 Länge	Die Rechtswert-Koordinate der gewählten Kartenprojektion des Projekts, die örtliche Länge des Projektpunkts oder die WGS-84 Länge.
Ellips. Höhe	Die ellipsoidische Höhe des Punktes über oder unter dem (örtlichen) Projektellipsoid oder WGS-84-Ellipsoid. Der Wert wird in Projekteinheiten dargestellt.
Höhe	Die orthometrische Höhe des Punktes über oder unter Normalnull. Die Höhe wird angezeigt, nachdem die Geoid-Abstände geladen und angewendet wurden. Der Wert wird in Projekteinheiten dargestellt.
Fest	Der festgehaltene (bedingte) Status der einzelnen Punktkomponenten. Alle in Klammern enthaltenen Koordinatenkomponenten-IDs oder ID-Gruppen geben an, daß die Komponente(n) Festpunktgüte haben und nicht festgehalten wurden. Alle Koordinatenkomponenten-IDs oder ID-Gruppen ohne Klammern zeigen an, daß die Koordinatenkomponente für den Punkt festgehalten wurde. Wird z. B. eine Gruppe von IDs (HR_h) für eine Komponente angezeigt bedeutet dies, daß der Hochwert, der Rechtswert und die orthometrische Höhe Festpunktgüte haben.

Die folgenden Statuswerte können in der Spalte Fest angezeigt werden:

Anzeige in der Spalte Fest:	Was festgehalten wurde:
____	Es wurde keine Komponente für diesen Punkt festgehalten
B,L oder HR__	Die horizontale Position wurde festgehalten
__ellh_	Die ellipsoidische Höhe wurde festgehalten
___h	Die orthometrische Höhe wurde festgehalten
B,L oder HRellh_	Die horizontale Position und die ellipsoidische Höhe wurden festgehalten
B,L oder HR_h	Die horizontale Position und die orthometrische Höhe wurden festgehalten
B,L oder HRellhh	Die horizontale Position und die ellipsoidische und orthometrische Höhe wurden festgehalten
__ellhh	Die ellipsoidische und die orthometrische Höhe wurde festgehalten

Wenn Sie eine Koordinatenkomponente eines Punktes festhalten (2D, Ellips Höhe, Höhe) und der Punkt keine Festpunktkoordinate hat, wird die Koordinate im Eigenschaftsfenster mit dem Koordinatentyp in der Koordinatenansicht aktualisiert.

Koordinatenansicht

Mit Hilfe dieser Schaltflächen werden die horizontalen Koordinatenkomponenten der Punkte im gewählten Koordinatensystem angezeigt. Diese Ansicht bestimmt auch, wie die Koordinaten gespeichert werden.

Gitter – Wählen Sie diese Option, um die Punkte als Koordinaten der Kartenprojektion anzuzeigen, die im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt wurde.

Örtlich – Wählen Sie diese Option, um Punkte als geographische Daten des Projektdatums anzuzeigen, das im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt wurde.

WGS-84 – Wählen Sie diese Option, um Punkte als geographische WGS-84 Koordinaten anzuzeigen.


    Festhalten

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Die Kontrollkästchen in dieser Gruppe aktivieren oder deaktivieren den Status für festgehaltene Koordinatenkomponenten eines Punktes.

Ein Häkchen wird im Kontrollkästchen angezeigt, wenn eine beliebige Punktkoordinate festgehalten wurde. Das Kontrollkästchen ist deaktiviert, wenn keine Koordinatenkomponenten festgehalten wurden. Die Koordinatenkomponenten sind 2D (horizontal), Ellips Höhe (Ellipsoid), und Höhe (orthometrische Höhe).

Folgende Optionen sind verfügbar:

2D

Wählen Sie dieses Kontrollkästchen, um den Hochwert und den Rechtswert oder die Breite und die Länge des Punktes festzuhalten.

Wenn diese Option gewählt ist, wird der festgehaltene Status in der Spalte Fest in der Liste Punkte angezeigt.

Ellips Höhe

Wählen Sie dieses Kontrollkästchen, um die Punkthöhe über oder unter dem Projektellipsoid des Punkts festzuhalten. Wenn diese Option gewählt ist, wird der festgehaltene Status in der Spalte Fest in der Liste Punkte angezeigt.

Höhe

Wählen Sie dieses Kontrollkästchen, um die orthometrische Höhe des Punktes festzuhalten. Diese Option steht nur zur Verfügung, nachdem Geoid-Abstände auf die Projektbeobachtungen angewendet wurden. Dieser Wert wird in Projekteinheiten angegeben. Wenn diese Option gewählt ist, wird der festgehaltene Status in der Spalte Fest der Punktliste angezeigt.

HINWEIS: Halten Sie im WGS-84 Datum nicht mehr als eine Gitterkoordinate fest.

Weitere Informationen über das Festhalten von Punktkoordinaten finden Sie unter Netzausgleichung.


Dialogfeld Beobachtungen - Überblick
    Dialogfeld Beobachtungen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Das Dialogfeld Beobachtungen enthält die Register GPS, Terrestrisch und Geoid. Verwenden Sie diese Register, um GPS-, terrestrische und Geoid-Beobachtungen in eine Netzausgleichung ein- oder auszuschließen und um die Beobachtungsrestwerte nach der Ausgleichung anzusehen.

So greifen Sie auf das Dialogfeld Beobachtungen zu:

  Wählen Sie Ausgleichung / Beobachtungen.

In den Registern GPS und Terrestrisch können Sie ebenfalls Beobachtungen deaktivieren. Eine deaktivierte Beobachtung wird nicht länger in Netzausgleichungen und Neuberechnungen verwendet und aus der Liste Beobachtungen entfernt.

Eine deaktivierte Beobachtung kann nicht erneut im Dialogfeld Beobachtungen aktiviert werden. Weitere Informationen finden Sie unter Beobachtungen deaktivieren und Deaktivierte Beobachtungen erneut aktivieren.

Im Register Geoid können darüber hinaus Geoid-Abstände geladen und entladen werden.

Folgende Optionen sind in jedem Register verfügbar:

Beobachtungen

Diese Liste enthält GPS-, terrestrische oder Geoid-Beobachtungen. Das Erscheinungsbild und der Inhalt der Liste sind für die einzelnen Beobachtungstypen unterschiedlich. Weitere Informationen über die in diesen Listen enthaltenen Spalten finden Sie unter folgenden Themen:

  Beobachtungen (GPS)

  Beobachtungen (Terrestrisch)

  Beobachtungen (Geoid)

Filter

Klicken Sie auf Filter, um das Dialogfeld Beobachtungsfilter zu öffnen. Es enthält Optionen zum Filtern von Beobachtungen. Weitere Informationen finden Sie unter Beobachtungen filtern.

Laden (nur im Register Geoid)

Klicken Sie auf Laden, um die Geoid-Abstände aus dem Geoid-Modell zu laden. Bevor diese Schaltfläche zur Verfügung steht, muß ein Geoid-Modell im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt werden.

Das Geoid-Modell und die horizontalen Koordinaten eines jeden Punktes werden zur Interpolation des Geoid-Abstands an diesem Punkt verwendet. Beim Laden der Geoid-Abstände wird die orthometrische Höhe für jeden Punkt mit Hilfe der beobachteten Ellipsoid-Höhe und des Geoid-Abstands berechnet. Geoid-Abstände werden in der Regel geladen, nachdem die Punktkoordinaten in einer vollständig bedingten Ausgleichung mit Hilfe des definierten Geoid-Modell-Datums bestimmt wurden.

Weitere Informationen finden Sie unter Geoid-Abstände laden.

Entladen (nur im Register Geoid)

Klicken Sie auf Entladen, um die Geoid-Abstände aus dem Projekt zu entfernen. Wenn Sie die Geoid-Abstände wieder in Ihrem Projekt verwenden möchten, laden Sie diese Abstände erneut, indem Sie auf die Schaltfläche Laden klicken. Diese Schaltfläche steht nur zur Verfügung, wenn das Register Geoid gewählt ist.

Die Schaltfläche ist deaktiviert, wenn im Dialogfeld Projekteigenschaften kein Geoid-Modell  gewählt wurde oder keine Geoid-Abstände in das Projekt geladen wurden.

Wenn die Beobachtungen aus dem Projekt gelöscht werden, werden alle Beobachtungen aus der Liste Beobachtungen entfernt.

Weitere Informationen finden Sie unter Geoid-Abstände entladen.


    Beobachtungen (GPS)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie die Liste Beobachtungen in diesem Register, um:

 GPS-Beobachtungen ein- oder auszuschließen

 Beobachtungsrestwerte anzusehen

 Beobachtungen zu deaktivieren

In dieser Liste sind lediglich die in der Netzausgleichung verwendeten Beobachtungen enthalten. Sie können nur die Spalte Verwenden bearbeiten; die anderen Spalten sind reine Referenzspalten.

TIP: Die Beobachtungen in dieser Liste können gefiltert werden, um eine beliebige Kombination von RTK, kinematischen, statischen oder kontinuierlichen Beobachtungen anzuzeigen. Das Filtern von Beobachtungen ist nützlich, wenn bestimmte Beobachtungstypen zeitweise ausgeblendet werden sollen, um das Auffinden anderer Beobachtungen zu erleichtern. Weitere Informationen finden Sie unter Beobachtungen filtern.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Verwenden	Wählen oder deaktivieren Sie diese Kontrollkästchen, um Beobachtungen in die Netzausgleichung ein- oder auszuschließen. Verwenden Sie sie, um den aktuellen Status der einzelnen Beobachtungen in der Liste abzulesen.  HINWEIS: Sie können auch mit der rechten Maustaste auf eine Beobachtung klicken, um ein Menü mit dem Befehl zur Deaktivierung dieser Beobachtung anzuzeigen. Deaktivierte Beobachtungen werden aus der Liste Beobachtungen entfernt und können nicht länger für die Netzausgleichung verwendet werden. Deaktivierte Beobachtungen können im Dialogfeld Beobachtungen nicht wieder aktiviert werden. Weitere Informationen finden Sie unter Deaktivierte Beobachtungen erneut aktivieren.
Beob.	Die Datensatznummern, die den Beobachtungen zugeordnet wurden. Vor der Datensatznummer steht der Buchstabe "B", der angibt, daß es sich um eine GPS-Beobachtung handelt.
Startpunkt	Der Startpunktname der Beobachtung.
Endpunkt	Der Endpunktname der Beobachtung.
Typ	Die zur Datenerfassung verwendete Vermessungsmethode. Mögliche Werte sind RTK, Kinematisch, Statisch und Kontinuierlich.
Varianzgruppe	Die mit den Beobachtungen verknüpfte Varianzgruppe (falls vorhanden).
Std Restw (Max)	Der berechnete standardisierte Restwert der Beobachtung.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Beobachtungen (Terrestrisch)

Weitere Informationen

 Dialogfeld

Überblick

Verwenden Sie die Liste Beobachtungen in diesem Register, um:

 Terrestrische Beobachtungen ein- oder auszuschließen

 Beobachtungsrestwerte anzusehen

 Beobachtungen zu deaktivieren

Sie können nur die Spalte Verwenden bearbeiten; die anderen Spalten sind reine Referenzspalten.

TIP: Sie können die Beobachtungen in dieser Liste filtern, um eine beliebige Kombination von Azimuten, horizontalen Winkeln, Ellipsoid-Strecken, Höhenunterschieden oder trigonometrischen Höhen der Beobachtungen anzuzeigen. Durch das Filtern werden bestimmte Beobachtungen zeitweise ausgeblendet, um das Auffinden anderer Beobachtungen zu erleichtern.

Für das Filtern terrestrischer Beobachtungen sollten Sie alle Beobachtungen ausgewählt lassen, wenn Sie nicht genau wissen, welche Beobachtungstypen Sie wählen sollen. Wenn Sie eine Option wählen, ist dies gleichbedeutend mit der Auswahl einer Teilbeobachtung.

Wenn Sie zum Beispiel den Filter Ellipsoid-Strecke wählen, dann werden nur Beobachtungen angezeigt, die eine Ellipsoid-Strecke enthalten. Beobachtungen mit horizontalen Winkeln und Ellipsoid-Strecken werden nur dann angezeigt, wenn Sie beide Filteroptionen wählen.

  Wenn Sie das Kontrollkästchen Azimut wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden nur Beobachtungen mit eingegebenen Azimuten angezeigt.

  Wenn Sie das Kontrollkästchen Höhenunt. wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden Nivellierdaten ausgewählt.

 Wenn Sie Rohbeobachtungen ansehen möchten, wählen Sie die Kontrollkästchen Horizontaler Winkel, Ellipsoid-Strecke und Trig. Höhe.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Verwenden	Wählen Sie diese Kontrollkästchen, um Beobachtungen in eine Netzausgleichung ein- oder auszuschließen und um den aktuellen Status der einzelnen Beobachtungen in der Liste abzulesen.  HINWEIS: Sie können auch mit der rechten Maustaste auf eine Beobachtung klicken, um ein Menü mit dem Befehl zur Deaktivierung dieser Beobachtung anzuzeigen. Deaktivierte Beobachtungen werden aus der Beobachtungsliste entfernt und können erst wieder in einer Ausgleichung verwendet werden, nachdem sie erneut aktiviert wurden. Deaktivierte Beobachtungen können im Dialogfeld Beobachtungen nicht wieder aktiviert werden. Weitere Informationen finden Sie unter Deaktivierte Beobachtungen erneut aktivieren.
Beob.	Die Datensatznummern, die den Beobachtungen zugeordnet wurden. Vor der Datensatznummer steht der Buchstabe "T", der angibt, daß es sich um eine terrestrische Beobachtung handelt.
Rückbl.-Punkt	Der Name des Rückblick-Punkts.
Instr.pkt.	Der Name des Instrumentenpunkts.
Vorbl.-Punkt	Der Name des Vorblick-Punkts.
Varianzgruppe	Die Varianzgruppe, die mit den Beobachtungen verknüpft ist.
Std Restw (Max)	Der berechnete standardisierte Restwert der Beobachtung.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.

HINWEIS: Nivellier- und Azimut-Beobachtungen werden wie terrestrische Beobachtungen behandelt. Verwenden Sie für diese Beobachtungen die Spalte Instr.pkt. als Startpunkt und die Spalte Vorbl.-Punkt als Endpunkt.


    Beobachtungen (Geoid)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie die Liste Beobachtungen in diesem Register, um Geoid-Beobachtungen anzusehen. Sie können nur die Spalte Verwenden bearbeiten. Alle anderen Spalten sind reine Referenzspalten.

Geoid-Abstände werden für alle Punkte in der Ausgleichung aus dem aktuellen Geoid-Modell berechnet.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Verwenden	Wählen Sie diese Kontrollkästchen, um Beobachtungen in die Netzausgleichung ein- oder auszuschließen. Verwenden Sie sie, um den aktuellen Status der einzelnen Beobachtungen in der Liste abzulesen.
Beob.	Die Datensatznummern, die den Beobachtungen zugeordnet wurden. Vor der Datensatznummer steht der Buchstabe "G", der angibt, daß es sich um eine Geoid-Beobachtung handelt.
Punkt	Der Name des Punkts, der zur Erstellung der Geoid-Beobachtung verwendet wurde.
Abstand	Die Differenz zwischen der ellipsoidischen Höhe (Ellipsoid) und der orthometrischen Höhe (Geoid).
Fehler	Der mittlere Fehler der Geoid-Beobachtungen. Er wird berechnet, wenn Geoid-Beobachtungen geladen werden. Wenn Sie den mittleren Fehler überschreiben möchten, stellen Sie den minimalen mittleren Fehler im Dialogfeld Netzausgleichungsstile ein.
Varianzgruppe	Der Name der Varianzgruppe, die mit einer Beobachtung verknüpft ist. Für Geoid-Beobachtungen erscheint in dieser Spalte nur die Varianzgruppe <Geoid-Voreinstellung>.
Std Restw	Der berechnete standardisierte Restwert der Beobachtung.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Dialogfeld Beobachtungsfilter - Überblick
    Dialogfeld Beobachtungsfilter − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Überblick

Verwenden Sie dieses Dialogfeld, um die Beobachtungstypen in der Liste Verfügbare Beobachtungen zu filtern.

So greifen Sie auf das Dialogfeld Beobachtungsfilter zu:

  Klicken Sie in einem beliebigen Dialogfeld, das eine Liste mit Verfügbaren Beobachtungen enthält, auf Filter.

Alle Filter sind gemäß Voreinstellung aktiviert, so daß alle Beobachtungstypen in der Liste angezeigt werden. Klicken Sie auf das entsprechende Häkchen, um bestimmte Filter zu deaktivieren. Folgende Optionen sind verfügbar:

Wählen Sie dieses Kontrollkästchen …	um folgende Beobachtungen zu filtern …
RTK	RTK (Echtzeit-kinematische) Beobachtungen
Kinematisch	Kinematische Beobachtungen
Statisch	Statische Beobachtungen
Kontinuierlich	Kontinuierliche kinematische Beobachtungssegmente
Azimut	Azimut-Beobachtungen. Mit dieser Option werden eingegebene Azimut-Beobachtungen ausgewählt.
Horizontaler Winkel	Beobachtungen horizontaler Winkel
Ellipsoid-Strecke	Ellipsoid-Strecken Beobachtungen
Höhenunt.	Höhenunterschied-Beobachtungen. Diese Option wird zum Filtern von Nivellierbeobachtungen verwendet.
Trig. Höhe	Beobachtungen trigonometrischer Höhen.  Diese Beobachtungen sind eine Repräsentation eines vertikalen Winkels und einer Schrägstrecken-Beobachtung.
Für das Filtern terrestrischer Beobachtungen sollten Sie alle Beobachtungen ausgewählt lassen, wenn Sie nicht genau wissen, welche Beobachtungstypen Sie wählen sollen. Wenn Sie eine Option wählen, ist dies gleichbedeutend mit der Auswahl einer Teilbeobachtung. Wenn Sie zum Beispiel den Filter Ellipsoid-Strecke wählen, dann werden nur Beobachtungen angezeigt, die eine Ellipsoid-Strecke enthalten. Beobachtungen mit horizontalen Winkeln und Ellipsoid-Strecken werden nur dann angezeigt, wenn Sie beide Filteroptionen wählen.

  Wenn Sie das Kontrollkästchen Azimut wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden nur Beobachtungen mit eingegebenen Azimuten angezeigt.

  Wenn Sie das Kontrollkästchen Höhenunt. wählen und die Kontrollkästchen für die anderen Beobachtungen deaktivieren, werden Nivellierdaten ausgewählt.

 Wenn Sie Rohbeobachtungen ansehen möchten, wählen Sie die Kontrollkästchen Horizontaler Winkel, Ellipsoid-Strecke und Trig. Höhe.


Dialogfeld Varianzgruppen - Überblick
    Dialogfeld Varianzgruppen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Das Dialogfeld Varianzgruppen enthält die Register GPS, Terrestrisch und Geoid. Verwenden Sie diese Register, um Varianzgruppen für GPS-Beobachtungen und terrestrische Beobachtungen anzusehen, zu erstellen, zu bearbeiten und zu löschen oder um die voreingestellte Varianzgruppe für Geoid-Abstände anzusehen.

So greifen Sie auf das Dialogfeld zu:

  Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen.

Folgende Optionen sind in jedem Register verfügbar:

Gruppen

Verwenden Sie diese Liste, um eine Auswahl zu treffen, bevor Sie Varianzgruppen bearbeiten oder löschen. Wenn neue Varianzgruppen erstellt werden, werden sie zu dieser Liste hinzugefügt.

Varianzgruppen für GPS-Beobachtungen werden angezeigt, wenn das Register GPS gewählt ist, terrestrische Beobachtungen werden angezeigt, wenn das Register Terrestrisch gewählt ist, und Geoid-Beobachtungen werden angezeigt, wenn das Register Geoid gewählt ist.

HINWEIS: Die Gruppe <Geoid-Voreinstellung> enthält anfänglich keine Beobachtungen. Beobachtungen erscheinen in der Liste, wenn ein Geoid-Modell unter Projekteigenschaften definiert wird und Geoid-Abstände in das Projekt geladen werden.

Neu

Wählen Sie diese Schaltfläche, um eine neue Varianzgruppe für das Projekt zu erstellen.

Wenn Sie diese Schaltfläche wählen, wird das Dialogfeld Neue Varianzgruppe angezeigt, und Sie können einen Namen für die Varianzgruppe eingeben. Wenn Sie auf OK klicken, um die neue Gruppe zu erstellen, wird das Dialogfeld Varianzgruppe bearbeiten angezeigt. Es enthält Optionen zur Hinzufügung von GPS- oder terrestrischen Beobachtungen zu der Gruppe. Die Schaltfläche Neu steht nicht zur Verfügung, wenn die Varianzgruppe <Geoid-Voreinstellung> angezeigt wird.

Bearbeiten

Wählen Sie diese Schaltfläche, um eine bestehende Varianzgruppe, die Sie aus der Gruppenliste ausgewählt haben, zu bearbeiten. Die ausgewählte Gruppe wird in das Dialogfeld Varianzgruppe bearbeiten geladen, wo individuelle Beobachtungen zu der Gruppe hinzugefügt oder aus der Gruppe gelöscht werden können.

Alle GPS- und terrestrischen Varianzgruppen können bearbeitet werden. Die Geoid-Varianzgruppe kann lediglich angezeigt werden.

Löschen

Wählen Sie diese Schaltfläche, um die aus der Gruppenliste gewählte Varianzgruppe zu löschen.

Wenn Sie diese Schaltfläche wählen, werden Sie aufgefordert, das Löschen der Varianzgruppe zu bestätigen. Wählen Sie OK, um fortzufahren oder Abbrechen, um den Vorgang abzubrechen.

HINWEIS: Die Varianzgruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> und <Geoid-Voreinstellung> können nicht gelöscht werden.

HINWEIS: Für Beobachtungen auf sehr kurzen Basislinien (< 25 Meter) empfiehlt Trimble, eine separate Varianzgruppe zu erstellen, damit diese Beobachtungen getrennt skaliert werden können.


Dialogfeld Varianzgruppen bearbeiten - Überblick
    Dialogfeld Varianzgruppe bearbeiten − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Das Dialogfeld Varianzgruppe bearbeiten enthält die Register GPS, Terrestrisch und Geoid. Verwenden Sie diese Register, um Varianzgruppen, GPS-Beobachtungen, terrestrische Beobachtungen und Geoid-Abstände anzusehen und zu bearbeiten. Varianzgruppen zu bearbeiten bedeutet, Beobachtungen hinzuzufügen oder zu entfernen.

So greifen Sie auf das Dialogfeld Varianzgruppen bearbeiten zu:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register GPS, Terrestrisch oder Geoid.

3.	Wählen Sie die gewünschte Gruppe.

4.	Klicken Sie auf Bearbeiten. Das Dialogfeld Varianzgruppe bearbeiten erscheint. Weitere Informationen finden Sie unter Varianzgruppen bearbeiten.

Folgende Optionen sind in jedem Register verfügbar:

Gruppenname

Dieses Feld enthält den Namen der der Varianzgruppe zugeordnet wurde. Dieses Feld ist ein reines Anzeigefeld und kann nicht bearbeitet werden.

Gruppenbeobachtungen

Verwenden Sie diese Liste, um die in einer Varianzgruppe enthaltenen Beobachtungen anzusehen. Es gibt drei Variationen dieser Liste—eine Liste für GPS-Beobachtungen, eine für terrestrische Beobachtungen und eine weitere Liste mit Beobachtungen, für die Geoid-Abstände existieren. Weitere Informationen zu den Spalten in dieser Liste finden Sie unter folgenden Themen:

  Gruppenbeobachtungen (GPS)

  Gruppenbeobachtungen (terrestrisch)

  Gruppenbeobachtungen (Geoid)

Verfügbare Beobachtungen

Verwenden Sie diese Liste, um alle in einer Netzausgleichung enthaltenen GPS-Beobachtungen anzusehen. Beobachtungen können aus der Liste ausgewählt und zu der Varianzgruppe hinzugefügt werden. Alle Felder sind reine Anzeigefelder und können nicht bearbeitet werden. Weitere Informationen finden Sie unter folgenden Themen:

  Verfügbare Beobachtungen (GPS)

  Verfügbare Beobachtungen (terrestrisch)

  Verfügbare Beobachtungen (Geoid)

HINWEIS: Die Liste Verfügbare Beobachtungen erscheint zwar, ist aber nicht aktiv, wenn Sie die Varianzgruppe <Geoid-Voreinstellung> bearbeiten.

Hinzufügen

Wählen Sie diese Schaltfläche, um Beobachtungen zu Varianzgruppen hinzuzufügen. Diese Schaltfläche steht nur zur Verfügung, wenn eine Beobachtung in der Liste Verfügbare Beobachtungen gewählt wurde. Die ausgewählte Beobachtung wird zur der Liste Gruppenbeobachtungen hinzugefügt. Weitere Informationen finden Sie unter Beobachtungen hinzufügen.

Entfernen

Wählen Sie diese Schaltfläche, um eine Beobachtung aus einer Varianzgruppe zu entfernen. Diese Schaltfläche steht nur zur Verfügung, wenn eine Beobachtung in der Liste Gruppenbeobachtungen gewählt wurde. Die Schaltfläche ist nur verfügbar, wenn eine benutzerdefinierte Varianzgruppe und nicht die voreingestellte Varianzgruppe bearbeitet wird. Weitere Informationen finden Sie unter Beobachtungen entfernen.

Filter

Wählen Sie diese Schaltfläche, um Beobachtungen in der Liste Verfügbare Beobachtungen zu filtern.

Das Dialogfeld Beobachtungsfilter wird angezeigt. Es enthält Optionen zum Filtern der Beobachtungen in der Liste.

Sie können für GPS-Beobachtungen im Dialogfeld Varianzgruppe bearbeiten eine beliebige Kombination der Beobachtungstypen RTK, Kinematisch, Statisch und Kontinuierlich anzeigen oder ausblenden, indem Sie die entsprechenden Optionen in diesem Dialogfeld wählen. Im Dialogfeld Varianzgruppe bearbeiten können Sie für terrestrische Beobachtungen eine beliebige Kombination der Beobachtungen Azimut, Horizontaler Winkel, Ellipsoid-Strecke, Höhenunt. oder Trig. Höhe ein- oder ausblenden.

Weitere Informationen finden Sie unter Beobachtungen filtern.


Gruppenbeobachtungen (Varianzgruppe - GPS)
    Gruppenbeobachtungen (Varianzgruppe − GPS)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Sehen Sie sich die in einer Varianzgruppe enthaltenen Beobachtungen in dieser Liste an. Die Liste erscheint in dieser Form nur für Varianzgruppen mit GPS-Beobachtungen.

TIP: Beobachtungen können zu der Liste hinzugefügt oder aus der Liste entfernt werden. Alle Felder sind reine Anzeigefelder und können nicht bearbeitet werden. Wenn eine Beobachtung in der Liste hervorgehoben ist, wird die Schaltfläche Entfernen verfügbar, und die Beobachtung kann aus der Liste entfernt werden. Weitere Informationen finden Sie unter Beobachtungen hinzufügen und Beobachtungen entfernen.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung im Projekt zugeordnet wurde
Startpunkt	Der Startpunkt der Beobachtung.
Endpunkt	Der Endpunkt der Beobachtung.
Typ	Die zur Datenerfassung verwendete Vermessungsmethode. Mögliche Werte sind RTK, Kinematisch, Statisch und Kontinuierlich.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Verfügbare Beobachtungen (Varianzgruppe - GPS)
    Verfügbare Beobachtungen (Varianzgruppe − GPS)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie diese Liste, um alle in der Netzausgleichung enthaltenen GPS-Beobachtungen anzusehen. Beobachtungen können aus dieser Liste ausgewählt und zu der Varianzgruppe hinzugefügt werden. Alle Felder sind reine Anzeigefelder und können nicht bearbeitet werden.

Jede Reihe in der Liste entspricht der Varianzgruppeninformation für eine Beobachtung. Verwenden Sie die Liste als Quelle, um Beobachtungen zu der Varianzgruppe hinzuzufügen. Wenn eine Beobachtung in der Liste gewählt ist, wird die Schaltfläche Hinzufügen verfügbar. Beobachtungen können zur Liste Gruppenbeobachtungen hinzugefügt werden.

TIP: Sie können die Schaltfläche Filter verwenden, um eine beliebige Kombination von RTK, kinematischen, statischen oder kontinuierlichen Beobachtungen anzuzeigen. Das Filtern von Beobachtungen ist nützlich, wenn Beobachtungen zeitweise ausgeblendet werden sollen, um das Auffinden anderer Beobachtungen zu erleichtern. Weitere Informationen finden Sie unter Beobachtungen filtern.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung im Projekt zugeordnet wurde.
Startpunkt	Der Startpunkt der Beobachtung.
Endpunkt	Der Endpunkt der Beobachtung.
Typ	Die zur Datenerfassung verwendete GPS-Vermessungsmethode. Mögliche Werte sind RTK, Kinematisch, Statisch und Kontinuierlich.
Varianzgruppe	Gibt an, ob die Beobachtung einer Varianzgruppe zugeordnet wurde.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Gruppenbeobachtungen (Varianzgruppe - Geoid) .
    Gruppenbeobachtungen (Varianzgruppe − Geoid)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Jeder Reihe in der Liste ist ein im Projekt gespeicherter Beobachtungsdatensatz. Sie können keines dieser Felder bearbeiten.

Folgende Spalten werden angezeigt:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer der Beobachtung, die im Projekt gespeichert wurde.
Punkt	Der Name des Punktes, dessen Koordinaten verwendet wurden, um die Geoid-Beobachtungen aus dem Modell zu entnehmen.
Abstand	Die Höhe der Geoid-Beobachtung, die aus dem unter Projekteigenschaften definierten Geoid-Modell abgeleitet wurde.
Fehler	Der geschätzte Fehler im Geoid-Abstand

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Verfügbare Beobachtungen (Varianzgruppe - Geoid)
    Verfügbare Beobachtungen (Varianzgruppe − Geoid)

Weitere Informationen

 Siehe auch

Überblick

Die Liste Verfügbare Beobachtungen ist deaktiviert und wird nicht verwendet.


    Dialogfeld Neue Varianzgruppe

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Dialogfeld, um eine neue Varianzgruppe zu erstellen.

HINWEIS: Diese Schaltfläche steht nicht zur Verfügung, wenn das Register Geoid gewählt ist. Da dieselbe Interpolationsmethode für alle Geoid-Beobachtungen im selben Geoid-Modell verwendet wird, ist es nicht erforderlich, die Beobachtungen in mehrere Gruppen aufzuteilen.

So greifen Sie auf das Dialogfeld Neue Varianzgruppe zu:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen. Das Dialogfeld Varianzgruppen erscheint.

2.	Wählen Sie das Register Geoid oder GPS.

3.	Klicken Sie auf Neu.

Das Dialogfeld Neue Varianzgruppe erscheint.

Folgende Optionen sind verfügbar:

Name

Geben Sie die Bezeichnung für die Varianzgruppe in dieses Feld ein. Der Name einer Varianzgruppe kann aus bis zu 255 Zeichen bestehen. Kürze Namen erleichtern jedoch das Auffinden in der Gruppenliste.

Wenn Sie der neuen Varianzgruppe eine Bezeichnung gegeben haben und auf OK klicken, wird das Dialogfeld Varianzgruppe bearbeiten angezeigt, das Optionen für das Hinzufügen oder Entfernen von Beobachtungen zu Varianzgruppen enthält. Weitere Informationen finden Sie unter Varianzgruppen erstellen.


Gruppenbeobachtungen (Varianzgruppe - Terrestrisch)
Gruppenbeobachtungen (Varianzgruppe − Terrestrisch)

Überblick

In der dieser Liste können Sie die in einer Varianzgruppe enthaltenen Beobachtungen ansehen. Die Liste wird in dieser Form nur für Varianzgruppen mit terrestrischen Beobachtungen angezeigt.

TIP: Sie können Beobachtungen aus der Liste entfernen und zur Liste hinzufügen. (Die Schaltfläche Entfernen wird verfügbar, wenn eine Beobachtung in der Liste hervorgehoben wird.) Sie können jedoch keines dieser Felder bearbeiten. Weitere Informationen finden Sie unter Beobachtungen hinzufügen und Beobachtungen entfernen.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung im Projekt zugeordnet wurde.
Rückbl.-Punkt	Der Name des Rückblick-Punkts der Beobachtung.
Instr.pkt.	Der Name des Instrumentenpunkts der Beobachtung.
Vorbl.-Punkt	Der Name des Vorblick-Punkts der Beobachtung.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.

HINWEIS: Nivellier- und Azimut-Beobachtungen werden wie terrestrische Beobachtungen behandelt. Verwenden Sie für diese Beobachtungen den Instrumentenpunkt als Startpunkt und den Vorblick-Punkt als Endpunkt.

HINWEIS: Wenn Sie eine terrestrische Varianzgruppe erstellen, wird eine getrennte Gruppe für jeden Beobachtungstyp erstellt. Wenn Sie z. B. eine terrestrische Varianzgruppe erstellen, die vertikale Winkel und Streckenbeobachtungen enthält, wird eine terrestrische Varianzgruppe für die Winkelbeobachtungen und eine terrestrische Varianzgruppe für die Streckenbeobachtungen erstellt. Dies gilt auch für die Varianzgruppe <Terr. Voreinstellung>.


Verfügbare Beobachtungen (Varianzgruppe - Terrestrisch)
Verfügbare Beobachtungen (Varianzgruppe − Terrestrisch)

Überblick

In dieser Liste können Sie alle terrestrischen Beobachtungen ansehen, die in der Netzausgleichung enthalten sind. Jede Reihe enthält die Varianzgruppe für eine Beobachtung. Sie können aus dieser Liste Beobachtungen auswählen, die zur Varianzgruppe hinzugefügt werden sollen. Sie können jedoch keines dieser Felder bearbeiten.

Wenn eine Beobachtung in der Liste gewählt wird, wird die Schaltfläche Hinzufügen verfügbar, und die Beobachtung kann zur Liste Gruppenbeobachtungen hinzugefügt werden.

TIP: Sie können die Schaltfläche Filter verwenden, um Beobachtungen zu filtern und eine beliebige Kombination der Beobachtungen Azimut, horizontaler Winkel, Ellipsoid-Strecke, Höhenunt. und Trig. Höhe anzuzeigen. Durch das Filtern werden bestimmte Beobachtungen zeitweise ausgeblendet. Kürzere Listen erleichtern das Auffinden anderer Beobachtungen. Weitere Informationen finden Sie unter Beobachtungen filtern.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung im Projekt zugewiesen wurde.
Rückbl.-Punkt	Der Name des Rückblick-Punkts der Beobachtung.
Instr.pkt.	Der Name des Instrumentenpunkts der Beobachtung.
Vorbl.-Punkt	Der Name des Vorblick-Punkts der Beobachtung.
Varianzgruppe	Gibt an, ob die Beobachtung einer Varianzgruppe zugeordnet wurde.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Dialogfeld Transformationsgruppen - Überblick
    Dialogfeld Transformationsgruppen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Dialogfeld Transformationsgruppen, um die Transformationsgruppen für die Netzausgleichung zu erstellen, zu bearbeiten und zu löschen.

Dieses Dialogfeld enthält die Register GPS, Terrestrisch und Geoid. Verwenden Sie diese Register, um Transformationsgruppen für GPS-Beobachtungen, terrestrische Beobachtungen und Geoid-Beobachtungen anzusehen oder auszuwählen.

So greifen Sie auf das Dialogfeld Transformationsgruppen zu:

  Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen.

Folgende Optionen sind in jedem Register verfügbar:

Gruppen

Verwenden Sie diese Liste, um eine Transformationsgruppe für GPS-, terrestrische oder Geoid-Beobachtungen auszuwählen.

Der Inhalt der Gruppenliste ändert sich, je nachdem, ob das Register GPS, Terrestrisch oder Geoid gewählt wurde

Es werden automatisch drei voreingestellte Transformationsgruppen erzeugt—die Gruppe <GPS-Voreinstellung>, die Gruppe <Terr. Voreinstellung> und die Gruppe <Geoid-Voreinstellung>. Die Gruppe <Geoid-Voreinstellung> ist entweder leer oder enthält alle Beobachtungen, für die Geoid-Abstände existieren.

HINWEIS: Die Gruppe <Geoid-Voreinstellung> ist leer, wenn kein Geoid-Modell für das Projekt definiert ist oder keine Geoid-Abstände in das Projekt geladen wurden. Informationen zur Definition eines Geoid-Modells für ein Projekt finden Sie unter Koordinatensystem. Informationen über das Laden von Geoid-Abständen aus einem Geoid-Modell für die Ausgleichung finden Sie unter Beobachtungen.

Es steht jeweils eine Registerliste für die Auswahl von GPS-, terrestrischen und Geoid-Transformationsgruppen zur Verfügung. Das Register GPS enthält die Gruppe <GPS-Voreinstellung> und alle zusätzlichen benutzerdefinierten GPS-Gruppen, die für das Projekt erstellt wurden. Das Register Terrestrisch enthält die Gruppe <Terr. Voreinstellung> sowie alle benutzerdefinierten terrestrischen Gruppen im Projekt. Im Register Geoid wird nur die Gruppe <Geoid-Voreinstellung> angezeigt. Es können keine neuen Geoid-Gruppen in diesem Register erstellt werden.

Nachdem eine Gruppe aus der Liste ausgewählt wurde, kann eine der verfügbaren Schaltflächen benutzt werden, um die Transformationsgruppe (falls erforderlich) zu bearbeiten oder zu löschen.

Neu

Verwenden Sie diese Schaltfläche, um eine neue Transformationsgruppe zu erstellen. Diese Schaltfläche steht nicht für Geoid-Transformationsgruppen zur Verfügung.

HINWEIS: Die Gruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> und <Geoid-Voreinstellung> können nicht gelöscht werden. Die Transformationsgruppe <Geoid-Voreinstellung> ist die einzige Geoid-Transformationsgruppe. Die Erstellung mehrerer Geoid-Transformationsgruppen ist nicht erforderlich, da alle Geoid-Beobachtungen aus einer einzigen Quelle, dem Geoid-Modell, entnommen sind. In der Gruppe <Geoid-Voreinstellung> können nur die Transformationsparameter geändert werden.

Weitere Informationen finden Sie unter Transformationsgruppen erstellen.

Bearbeiten

Verwenden Sie diese Schaltfläche, um GPS-, terrestrische oder Geoid-Transformationsgruppen anzuzeigen oder zu bearbeiten. Diese Schaltfläche ist immer dann verfügbar, wenn die Liste der GPS-, terrestrischen oder Geoid-Gruppen angezeigt wird.

Wenn Sie diese Schaltfläche wählen, erscheint das Dialogfeld Transformationsgruppe bearbeiten, das Optionen zum Hinzufügen oder Entfernen von Gruppenbeobachtungen (nur GPS und terrestrisch) und zur Bearbeitung von Transformationsparametern enthält.

Weitere Informationen finden Sie unter Transformationsgruppen bearbeiten.

Löschen

Verwenden Sie diese Schaltfläche, um ausgewählte GPS- oder terrestrische Transformationsgruppen zu löschen. Die Gruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> und <Geoid-Voreinstellung> können nie aus dem Projekt gelöscht werden. Es können nur benutzerdefinierte GPS- oder terrestrische Transformationsgruppen gelöscht werden.

HINWEIS: Da die Gruppe <Geoid-Voreinstellung> nicht gelöscht werden kann und keine neuen Geoid-Transformationsgruppen erstellt werden können, steht diese Schaltfläche nicht für Geoid-Transformationsgruppen zur Verfügung.

Weitere Informationen finden Sie unter Transformationsgruppen löschen.


    Dialogfeld Neue Transformationsgruppe

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Dialogfeld Neue Transformationsgruppe, um eine neue GPS- oder terrestrische Transformationsgruppe zu erstellen.

HINWEIS: Diese Schaltfläche steht nicht zur Verfügung, wenn das Register Geoid gewählt wurde. Da dieselbe Interpolationsmethode für alle Geoid-Beobachtungen im selben Geoid-Modell verwendet wird, ist eine Einteilung der Beobachtungen in mehrere Gruppen nicht erforderlich.

So greifen Sie darau zu:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie das Register GPS oder Terrestrisch.

3.	Klicken Sie auf Neu. Das Dialogfeld Neue Transformationsgruppe erscheint.

Folgende Option ist verfügbar:

Name

Geben Sie den Namen der Transformationsgruppe in dieses Feld ein. Die Namen von Transformationsgruppen können bis zu 24 Zeichen enthalten. Kürzere Namen sind jedoch in den Gruppenlisten einfacher aufzufinden.

Wenn Sie eine Bezeichnung für die neue Transformationsgruppe eingegeben haben und auf OK klicken, erscheint das Dialogfeld Transformationsgruppe bearbeiten, das Optionen zum Hinzufügen und Entfernen von Beobachtungen zu Transformationsgruppen und zur Definition von Transformationsparametern enthält. Weitere Informationen finden Sie unter Transformationsgruppen erstellen.


Dialogfeld Transformationsgruppen bearbeiten - Überblick
    Dialogfeld Transformationsgruppe bearbeiten − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Dialogfeld Transformationsgruppe bearbeiten, um Transformationsgruppen für GPS-, terrestrischen oder Geoid-Beobachtungen anzusehen, zu bearbeiten und zu überprüfen.

So greifen Sie darauf zu:

1.	Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen. Das Dialogfeld Transformationsgruppen erscheint.

2.	Wählen Sie im Register GPS, Terrestrisch oder Geoid die gewünschte Gruppe.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Transformationsgruppe bearbeiten erscheint. Weitere Informationen finden Sie unter Transformationsgruppen bearbeiten.

Die Bearbeitung einer GPS- oder terrerstrischen Transformationsgruppe schließt das Hinzufügen oder Entfernen von Netzausgleichungsbeobachtungen und die Definition von Transformationsparametern ein. Da die Geoid-Transformationsgruppe alle aktivierten Netzausgleichungsbeobachtungen enthält, für die ein Geoid-Modell und Geoid-Abstände existieren, ist die Bearbeitung von Geoid-Transformationsgruppen auf die Definition von Transformationsparametern beschränkt.

HINWEIS: Die Gruppe <Geoid-Voreinstellung> ist leer, wenn kein Geoid-Modell für das Projekt definiert ist oder keine Geoid-Abstände in das Projekt geladen wurden. Informationen zur Definition eines Geoid-Modells für ein Projekt finden Sie unter Koordinatensystem. Informationen zum Laden von Geoid-Abständen aus einem Geoid-Modell finden Sie unter Beobachtungen.

Eine beliebige Kombination von Transformationsparametern kann definiert oder berechnet werden, um Transformationen auf die Beobachtungen in der Transformationsgruppe anzuwenden. Mehrere GPS- oder terrestrische Transformationsgruppen können erstellt und unterschiedliche Kombinationen von Transformationsparametern können auf jede einzelne Gruppe angewendet werden.

ACHTUNG: Wenn Transformationsgruppen nicht korrekt angewendet werden, kann sich dies nachteilig auf Ihre Ausgleichung auswirken. Alle Transformationsparameter sollten überprüft werden, bevor Transformationen auf eine Gruppe von Beobachtungen angewendet werden.

Folgende Optionen sind verfügbar:

Gruppenname

Dieses Feld enthält den Namen, der der Transformationsgruppe zugeordnet wurde. Das Feld ist ein reines Anzeigefeld und kann nicht bearbeitet werden.

Transformationsparameter-Liste

Verwenden Sie diese Liste, um Transformationsparameter zu definieren, zu berechnen oder auszuschließen.

Folgende Parameter können definiert oder berechnet werden:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante

Jede Parameterdefinition enthält ein Wert- und Statusfeld. Weitere Informationen finden Sie unter folgenden Themen:

 Wert

 Status

Gemäß Voreinstellung sind folgende Transformationsparameter für Transformationsgruppen mit GPS-Beobachtungen auf ‘Berechnet‘ eingestellt:

   Längengrad-Ablenkung

   Breitengrad-Ablenkung

   Azimut-Rotation

   Netzmaßstab

Gemäß Voreinstellung wird nur die Azimut-Rotation für terrestrische Beobachtungen auf Berechnet eingestellt. Andere Parameter können auf Benutzerdefiniert oder Berechnet eingestellt werden, Sie sollten sie jeoch nur verwenden, wenn ein systematischer Fehler in den Beobachtungen enthalten ist. Wenn z. B. eine Ausgleichung durchgeführt wird und alle mit terrestrischen Methoden gemessenen Strecken einen Restwert von +3 ppm aufweisen, könnte der Parameter Streckenmaßstab berechnet werden, weil offensichtlich ein systematischer Fehler bei der Datenerfassung aufgetreten ist. Dieser systematische Fehler kann verursacht werden, wenn die ppm-Einstellung auf dem EDM nicht angewendet wird.

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für Geoid-Transformationen verwendet.

Grundlegende Richtlinien zur Definition von Transformationsparametern oder Parametersätzen finden Sie unter Transformationsparameter. Ausführlichere Informationen über Transformationsverfahren für Beobachtungsdaten finden Sie in der Bibliographie.

Gruppenbeobachtungen

Die Liste zeigt die in einer Transformationsgruppe enthaltenen GPS-, terrestrischen oder Geoid-Beobachtungen an. Unterschiedliche Variationen der Liste können angezeigt werden, abhängig von den Beobachtungstypen.

Weitere Informationen finden Sie unter folgenden Themen:

  Gruppenbeobachtungen (GPS)

  Gruppenbeobachtungen (terrestrisch)

  Gruppenbeobachtungen (Geoid)

Verfügbare Beobachtungen

Verwenden Sie diese Liste, um alle Beobachtungen in der Netzausgleichung anzusehen und um Beobachtungen zu einer Transformationsgruppe hinzuzufügen. Alle Felder sind reine Anzeigefelder und können nicht bearbeitet werden.

Weitere Informationen zu den Feldern in dieser Liste finden Sie unter folgenden Themen:

  Verfügbare Beobachtungen (GPS)

  Verfügbare Beobachtungen (terrestrisch)

  Verfügbare Beobachtungen (Geoid)

HINWEIS: Die Liste Verfügbare Beobachtungen wird zwar angezeigt, ist aber nicht aktiv, wenn die Transformationsgruppen <GPS-Voreinstellung>, <Terr. Voreinstellung> oder <Geoid-Voreinstellung> bearbeitet werden. Es können keine Beobachtungen aus den voreingestellten GPS-, terrestrischen oder Geoid-Transformationsgruppen entfernt werden.

Hinzufügen

Verwenden Sie diese Schaltfläche, um Beobachtungen zur Liste Gruppenbeobachtungen hinzuzufügen. Diese Schaltfläche steht nur zur Verfügung, wenn eine Beobachtung in der Liste Verfügbare Beobachtungen ausgewählt wurde.

Entfernen

Verwenden Sie diese Schaltfläche, um Beobachtungen aus der Liste  Gruppenbeobachtungen zu entfernen.

Filter

Verwenden Sie diese Schaltfläche, um das Dialogfeld Beobachtungsfilter anzuzeigen, das Optionen zum Filtern von Beobachtungstypen in der Liste Verfügbare Beobachtungen enthält.


    Wert (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie die Felder in der zweiten Spalte der Transformationsparameterliste, um den Wert, der auf die einzelnen Transformationsparameter angewendet wurde, anzusehen oder zu ändern.

Dieses Feld enthält die Transformationsparameterwerte. Die in der Statusliste ausgewählte Option bestimmt, ob und wie der Wert erzeugt wird.

Richtlinien für das Ändern der Werte- und Statusfelder einzelner Parameter finden Sie unter folgenden Themen:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante


    Status (Transformationsparameter)

Weitere Informationen

Dialogfeld	Siehe auch
Überblick

Verwenden Sie die Felder in der dritten Spalte der Transformationsparameterliste, um die Methode für die Bestimmung des Transformationsparameterwerts zu wählen.

Folgende Optionen sind verfügbar:

Berechnet

Verwenden Sie diese Option, wenn die Trimble Geomatics Office Software den Transformationsparameterwert als Teil der Ausgleichung berechnen soll. Die Werte für die einzelnen in der Liste enthaltenen Parameter werden berechnet, wenn genügend Koordinatenkomponenten für Punkte in der Ausgleichung festgehalten wurden. Weitere Informationen über das Festhalten von Koordinaten finden Sie unter Punkte.

Benutzerdefiniert

Verwenden Sie diese Option, um einen benutzerdefinierten Transformationsparameterwert einzugeben. Wenn ein Parameter bekannt ist, wird diese Option als Statusoption ausgewählt, und der bekannte Wert wird in das damit verbundene Wertefeld eingegeben.

ACHTUNG: Seien Sie besonders vorsichtig, wenn Sie den Parameterstatus auf diesen Wert einstellen und wenn Sie benutzerdefinierte Parameterwerte eingeben. Allgemeine Richtlinien zur Definition von Wert und Status individueller Parameter finden Sie unter Transformationsparameter.

Nicht verwendet

Verwenden Sie diese Option, um einen Transformationsparameterwert zu deaktivieren. Wenn ein Wert in das Wertefeld eingegeben wird, deaktiviert die Option diesen Wert. Ein deaktivierter Parameterwert wird weder berechnet noch auf die in der Transformationsgruppe enthaltenen Beobachtungen angewendet. Dies ist die Voreinstellung für alle Parameter.

ACHTUNG: Seien Sie beim Auswählen der Statusoption für einen Transformationsparameterwert vorsichtig. Wenn ein Transformationsparameter nicht korrekt angewendet wird, kann sich das negativ auf Ihre Ausgleichung auswirken.

Richtlinien für das Ändern der Statusoption individueller Parameter finden Sie unter folgenden Themen:

  Längengrad-Ablenkung

  Breitengrad-Ablenkung

  Azimut-Rotation

  Netzmaßstab

  Streckenmaßstab

  Strecken-Konstante

  Höhen-Konstante


    Längengrad-Ablenkung (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Wertefeld und die Statusliste, um den Ablenkungswinkel (in Bogensekunden) im örtlichen ebenen Koordinatensystem in Ost-West-Richtung anzusehen, zu überprüfen oder einzugeben.

Die Längengrad-Ablenkung ist einer der Rotationswinkel, die bei einer Datum-Transformation und manchmal auch bei terrestrischen Beobachtungen zur Berechnung einer LaPlace-Korrektur für beobachtete astronomische Azimute verwendet werden. Wenn Sie diesen Rotationswinkel verwenden, benötigen Sie drei (ellipsoidische oder orthometrische) Höhen an bekannten (nicht notwendigerweise festgehaltenen) horizontalen Positionen im Netz. Der Winkel wirkt sich auf rechtwinklige, lineare, horizontale und vertikale Beobachtungen (aber nicht auf Höhenunterschiede) aus und entspricht einer Komponente für die Lotabweichung.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


    Breitengrad-Ablenkung (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Wertefeld und die Statusliste, um den Ablenkungswinkel (in Bogensekunden) im örtlichen ebenen Koordinatensystem in Nord-Süd-Richtung anzusehen, zu überprüfen oder zu definieren.

Die Breitengrad-Ablenkung ist einer der Rotationswinkel, die bei einer Datum-Transformation verwendet werden. Wenn Sie diesen Rotationswinkel verwenden, benötigen Sie drei (ellipsoidische oder orthometrische) Höhen an bekannten (nicht notwendigerweise festgehaltenen) horizontalen Positionen im Netz. Der Winkel wirkt sich auf rechtwinklige, lineare, horizontale und vertikale Beobachtungen (aber nicht auf Höhenunterschiede) aus und entspricht einer Komponente für die Lotabweichung.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


    Azimut-Rotation (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Wertefeld und die Statusliste, um den Rotationswinkel des Koordinatensystems anzusehen, zu überprüfen, zu berechnen oder einzugeben. Der Rotationswinkel ist der Winkel gemessen von der Lotsenkrechten an jedem Punkt (in diesem Fall ist die Lotsenkrechte die Linie, die senkrecht auf dem Ellipsoid an jedem Punkt steht). Dieser Winkel gibt die Rotation zwischen dem ausgeglichenen Datum und dem beobachteten Datum in Bogensekunden an. Die Azimut-Rotation wird bei Datum-Transformationen verwendet und betrifft nur eingegebene Azimute.

Bei GPS-Beobachtungen sind für die Berechnung der Azimut-Rotation zwei horizontale Festpunkte erforderlich. Terrestrische Beobachtungen werden gemäß Voreinstellung rotiert und an die GPS-Azimute angepaßt.

Gemäß Voreinstellung wird nur die Azimut-Rotation für terrestrische Beobachtungen auf Berechnet eingestellt. Andere Parameter können auf Benutzerdefiniert oder Berechnet eingestellt werden, Sie sollten sie jedoch nur dann verwenden, wenn ein systematischer Fehler in den Beobachtungen enthalten ist. Wenn z. B. eine Ausgleichung durchgeführt wird und alle mit terrestrischen Methoden gemessenen Strecken einen Restwert von +3 ppm aufweisen, könnte der Parameter Streckenmaßstab berechnet werden, weil offensichtlich ein systematischer Fehler bei der Datenerfassung aufgetreten ist. Dieser systematische Fehler kann verursacht werden, wenn die ppm-Einstellung auf dem EDM nicht angewendet wird.

HINWEIS: Der Parameter Azimut-Rotation wird nicht für Geoid-Transformationen verwendet.

HINWEIS: Die Rotation wird nur auf Beobachtungen in der Ausgleichung angewendet. So wird z. B. für Polarpunkte, die nicht in die Ausgleichung eingeschlossen wurden, keine Rotation durchgeführt.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


    Netzmaßstab (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Wertefeld und die Statusliste, um einen Netzmaßstabs-Multiplikator anzusehen, zu überprüfen oder einzugeben, der auf jede lineare Beobachtung in der Ausgleichung angewendet werden soll. Der Netzmaßstab wird für die Transformation eines Beobachtungssatzes von einem Datum in ein anderes Datum benötigt.

Zur Berechnung eines Netzmaßstabs für GPS-Beobachtungen sind zwei horizontale Festpunkte und ein vertikaler Festpunkt erforderlich.

Zur Berechnung eines Netzmaßstabs für terrestrische Beobachtungen sind zwei horizontale Festpunkte oder zwei vertikale Festpunkte erforderlich.

Der Netzmaßstab wird auf alle linearen GPS-Beobachtungen in der Transformationsgruppe angewendet.

HINWEIS: Der Paramter Netzmaßstab wird nicht für Geoid-Transformationen verwendet.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


    Streckenmaßstab (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Überblick

Verwenden Sie das Wertefeld und die Statusliste, um den Streckenmaßstabs-Multiplikator, der auf jede Streckenbeobachtung in der Parametergruppe angewendet werden soll, anzusehen, zu überprüfen oder einzugeben.

Der Streckenmaßstab wird für Datum-Transformationen und manchmal auch zur Korrektur von systematischen Beobachtungsfehlern verwendet. Zur Berechnung dieses Parameters sind zwei festgehaltene horizontale Punkte erforderlich.

HINWEIS: Der Streckenmaßstabsparameter wird nicht für Geoid-Transformationen verwendet.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


    Strecken-Konstante (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Wertefeld und die Statusliste, um einen konstanten Streckenwert (in Projekteinheiten) für jede Streckenbeobachtung in der GPS-Parametergruppe anzusehen zu überprüfen und einzugeben. Dieser Parameter korrigiert systematische Streckenfehler in Beobachtungen. Zur Berechnung dieses Parameters sind zwei horizontale Festpunkte erforderlich.

HINWEIS: Der Parameter Strecken-Konstante wird nicht für Geoid-Transformationen verwendet.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


    Höhen-Konstante (Transformationsparameter)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Wertefeld und die Statusliste, um einen konstanten ellipsoidischen Höhenwert anzusehen, zu überprüfen oder einzugeben, der zu jeder vertikalen Beobachtung in der Transformationsgruppe hinzugefügt werden soll. Die Höhen-Konstante wird zur Korrektur systematischer Beobachtungsfehler und zur Tranformation von Geoid-Modellen verwendet. Zur Definition dieses Parameters sind eine orthometrische und eine ellipsoidische Höhe erforderlich.

Dieser Parameter korrigiert systematische Fehler in vertikalen Beobachtungen und wird zur Transformation von Geoid-Modellen verwendet.

Weitere Informationen finden Sie unter Transformationsparameter definieren.


Gruppenbeobachtungen (Transformationsgruppe - GPS)
    Gruppenbeobachtungen (Transformationsgruppe – GPS)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie diese Liste, um GPS-Transformationsgruppen anzusehen, Beobachtungen zu GPS-Transformationsgruppen hinzuzufügen oder daraus zu entfernen. Keines dieser Felder kann bearbeitet werden.

Folgende Spalten werden angezeigt:

Spalte	Was angezeigt wird
Beob.	Die ID, die den Beobachtungen zugeordnet wurden. GPS-Beobachtungen ist der Buchstabe "B" vorangestellt.
Startpunkt	Der Startpunktname der Beobachtung.
Endpunkt	Der Endpunktname der Beobachtung.
Typ	Die zur Datenerfassung verwendete Vermessungsmethode.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Verfügbare Beobachtungen (Transformationsgruppe - GPS)
    Verfügbare Beobachtungen (Transformationsgruppe − GPS)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie diese Liste, um alle aktivierten Beobachtungen in der Netzausgleichung anzusehen und um Beobachtungen zu einer GPS-Transformationsgruppe hinzuzufügen. Alle Felder sind reine Anzeigefelder und können nicht bearbeitet werden.

Wenn Daten zum ersten Mal in ein Projekt geladen werden, werden alle aktivierten Beobachtungen zu der Gruppe <GPS-Voreinstellung> hinzugefügt. Beobachtungen können in benutzerdefinierte Transformationsgruppen verschoben werden. Eine Beobachtung kann jedoch immer nur einer benutzerdefinierten Gruppe zugeordnet werden.

Jede Beobachtung kann aus der Liste ausgewählt und zu der aktuellen Transformationsgruppe hinzugefügt werden. Dies gilt auch für Beobachtungen, die anderen benutzerdefinierten Transformationsgruppen zugeordnet wurden. Wenn eine Beobachtung aus einer anderen Beobachtungsgruppe zu der aktuellen Gruppe hinzugefügt wird, wird sie aus der Gruppe, der sie ursprünglich zugeordnet war, entfernt.

TIP: Beobachtungen, die mit Hilfe einer oder mehrerer Vermessungsmethoden aufgezeichnet wurden, können gefiltert werden. Gefilterte Beobachtungen werden zeitweise ausgeblendet, und die Liste wird kürzer. Eine kürzere Liste erleichtert das Auffinden von Beobachtungen. Verwenden Sie das Feld Typ, um die Vermessungsmethode anzusehen, mit der die Beobachtungen durchgeführt wurden. Weitere Informationen finden Sie unter Beobachtungen filtern.

HINWEIS: Diese Liste enthält nicht alle Beobachtungen im Projekt, sondern nur die in der Netzausgleichung verwendeten Beobachtungen.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die ID, die den Beobachtungen zugeordnet wurden. GPS-Beobachtungen ist der Buchstabe "B" vorangestellt.
Startpunkt	Der Startpunktname der Beobachtung.
Endpunkt	Der Endpunktname der Beobachtung.
Typ	Die zur Datenerfassung verwendete Vermessungsmethode. Mögliche Werte sind RTK, Kinematisch, Statisch und Kontinuierlich.
Transformationsgruppe	Gibt an, ob die Beobachtung einer Transformationsgruppe zugeordnet wurde.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Gruppenbeobachtungen (Transformationsgruppe - Geoid)
    Gruppenbeobachtungen (Transformationsgruppe − Geoid)

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Liste, um die Transformationsgruppe <Geoid-Voreinstellung> anzusehen. Alle Felder sind reine Anzeigefelder und können nicht bearbeitet werden.

Alle in der Netzausgleichung verwendeten Geoid-Beobachtungen erscheinen automatisch in dieser Liste, wenn Geoid-Abstände in die Netzausgleichung geladen werden.

Es können keine Geoid-Beobachtungen aus dieser Liste gelöscht werden. Eine Beobachtung kann nur aus der Liste entfernt werden, wenn sie deaktiviert und somit nicht länger im Projekt verwendet wird.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die ID, die der Beobachtung zugeordnet wurde. Geoid-Beobachtungen ist der Buchstabe ‘G’ vorangestellt.
Punkt	Der Name des Punktes, dessen Koordinaten verwendet wurden, um die Geoid-Beobachtungen aus dem Modell zu entnehmen.
Abstand	Der Geoid-Abstand zwischen dem WGS-84 Ellipsoid und Normalnull.
Fehler	Der geschätzte Fehler der Geoid-Beobachtung.
HINWEIS: Der ursprünglich geschätzte Fehler des Geoid-Abstands ist der Standardfehler aus dem Mittel des Beobachtungssatzes. Die Trimble Geomatics Office Software berechnet die Fehler aller Geoid-Abstände in der Ausgleichung und bestimmt dann den mittleren Fehler aus dem Mittel eines jeden Abstands. Dies ist nur der Ausgangspunkt für die Fehlerschätzung im Geoid-Abstand. Sie müssen die Beobachtungen evtl. skalieren, bevor eine wahrheitsgetreue Darstellung der geschätzten Fehler erreicht werden kann.

HINWEIS: Sie können den mittleren Fehler ändern, indem Sie den minimalen mittleren Fehler für Geoid-Abstände im Dialogfeld Netzausgleichungsstile erhöhen.


Verfügbare Beobachtungen (Transformationsgruppe - Geoid)
    Verfügbare Beobachtungen (Transformationsgruppe − Geoid)

Weitere Informationen

 Siehe auch

Überblick

Die Liste Verfügbare Beobachtungen ist deaktiviert und wird nicht verwendet.


Gruppenbeobachtungen (Transformationsgruppe - Terrestrisch)
Gruppenbeobachtungen (Transformationsgruppe ? Terrestrisch)

Überblick

Verwenden Sie diese Liste, um terrestrische Transformationsgruppen anzusehen und um Beobachtungen zu terrestrischen Transformationsgruppen hinzuzufügen oder daraus zu entfernen. Die Informationen in dieser Liste können nicht bearbeitet werden.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die ID, die der Beobachtung zugewiesen wurde. Der Buchstabe "T" ist terrestrischen Beobachtungen vorangestellt. Der Buchstabe "L" ist Nivellierbeobachtungen vorangestellt.
Rückbl.-Punkt	Der Name des Rückblick-Punkts der Beobachtung.
Instr.pkt.	Der Name des Instrumentenpunkts der Beobachtung.
Vorbl.-Punkt	Der Name des Vorblick-Punkts der Beobachtung.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.

HINWEIS: Nivellier- und Azimut-Beobachtungen werden wie terrestrische Beobachtungen behandelt. Verwenden Sie für diese Beobachtungen den Instrumentenpunkt als Startpunkt und den Vorblick-Punkt als Endpunkt.


Verfügbare Beobachtungen (Transformationsgruppe - Terrestrisch)
Verfügbare Beobachtungen (Transformationsgruppe − Terrestrisch)

Überblick

Diese Liste enthält die in der Netzausgleichung verwendeten Beobachtungen. Verwenden Sie sie, um alle aktivierten Beobachtungen in der Netzausgleichung anzusehen. Sie können Sie ebenfalls als Ausgangspunkt verwenden, um Beobachtungen zu einer terrestrischen Transformationsgruppe hinzuzufügen. Die Informationen in dieser Liste können nicht bearbeitet werden.

Wenn Daten zum ersten Mal in ein Projekt geladen werden, werden alle aktivierten Beobachtungen zu der Gruppe <Terr. Voreinstellung> hinzugefügt. Wenn benutzerdefinierte Transformationsgruppen erstellt werden, werden die Beobachtungen aus der Gruppe <Terr. Voreinstellung> entfernt.

Jede Beobachtung kann aus der Liste ausgewählt und zu der aktuellen Transformationsgruppe hinzugefügt werden. Dies gilt auch für Beobachtungen, die anderen benutzerdefinierten Transformationsgruppen zugeordnet wurden. Wenn eine Beobachtung aus einer anderen Beobachtungsgruppe zu der aktuellen Gruppe hinzugefügt wird, wird sie aus der Gruppe, der sie ursprünglich zugeordnet war, entfernt.

TIP: Beobachtungen, die mit Hilfe einer oder mehrerer Vermessungsmethoden aufgezeichnet wurden, können gefiltert werden. Gefilterte Beobachtungen werden zeitweise ausgeblendet, und die Liste wird kürzer. Eine kürzere Liste erleichtert das Auffinden von Beobachtungen. Verwenden Sie das Feld Typ, um die Vermessungsmethode anzusehen, mit der die Beobachtungen durchgeführt wurden. Weitere Informationen finden Sie unter Beobachtungen filtern.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die ID, die der Beobachtung zugewiesen wurde. Der Buchstabe "T" ist terrestrischen Beobachtungen vorangestellt. Der Buchstabe "L" ist Nivellierbeobachtungen vorangestellt.
Rückbl.-Punkt	Der Name des Rückblick-Punkts der Beobachtung.
Instr.pkt.	Der Name des Instrumentenpunkts der Beobachtung.
Vorbl.-Punkt	Der Name des Vorblick-Punkts der Beobachtung.
Transformationsgruppe	Gibt an, ob die Beobachtung einer Transformationsgruppe zugeordnet wurde.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.

HINWEIS: Nivellier- und Azimut-Beobachtungen werden wie terrestrische Beobachtungen behandelt. Verwenden Sie für diese Beobachtungen den Instrumentenpunkt als Startpunkt und den Vorblick-Punkt als Endpunkt.


Dialogfeld Gewichtungsstrategien - Überblick
    Dialogfeld Gewichtungsstrategien − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Das Dialogfeld Gewichtungsstrategien ermöglicht Ihnen die Definition und die Anwendung von Gewichtungsstrategien auf GPS-Beobachtungen, terrestrische Beobachtungen, Geoid-Beobachtungen und Varianzgruppen.

So greifen Sie darauf zu:

  Wählen Sie Ausgleichung / Gewichtungsstrategien.

Das Dialogfeld Gewichtungsstrategien enthält die Register GPS, Terrestrisch und Geoid. Jedes Register enthält eine Liste mit Beobachtungen, in der Sie die Beobachtungen ansehen können, die in eine Netzausgleichung eingeschlossen wurden. Wählen Sie das entsprechende Register, um alle GPS-Beobachtungen, terrestrischen Beobachtungen und alle Punkte, für die Geoid-Abstände existieren, anzusehen.

Folgende Optionen sind in jedem Register verfügbar:

Skalare anwenden auf

Wählen Sie eine dieser Optionen, um die Methode zur Anwendung von Gewichtungsstrategien auf Beobachtungen oder Varianzgruppen zu definieren.

Skalartyp

Wählen Sie eine dieser Optionen, um einen Skalar mit Hilfe der Methode, die in der Gruppe Skalare anwenden auf festgelegt wurde, auf geschätzte Fehler anzuwenden. Weitere Informationen finden Sie unter Skalartyp.

Skalarwert

Dieses Feld ist nur aktiviert, wenn die Option Benutzerdefiniert in der Gruppe Skalartyp gewählt ist. Geben Sie einen Wert in dieses Feld ein, um den Skalarwert zu definieren und anzuwenden.

Wenn Sie auf Sperren klicken, wird der Skalar der aktuellen Ausgleichung in dieses Feld eingefügt.

ACHTUNG: Seien Sie besonders vorsichtig, wenn Sie dieses Feld bearbeiten. Richtlinien für die Bewertung von Ausgleichungsresultaten finden Sie in der Berichtstatistik Gewichtungsstrategien.

Beobachtungen

Prüfen Sie diese Liste, um den Skalar für alle GPS- und terrestrischen Beobachtungen oder für alle Beobachtungen, für die Geoid-Abstände existieren, anzusehen. Das Erscheinungsbild und der Inhalt der Liste sind unterschiedlich, je nachdem, ob das Register GPS, Terrestrisch oder Geoid gewählt ist. Weitere Informationen finden Sie unter den folgenden Themen:

  Beobachtungen (GPS)

  Beobachtungen (Terrestrisch)

  Beobachtungen (Geoid)

Gruppen

Diese Liste enthält die Varianzgruppen und den Skalarwert, der auf alle Beobachtungen in einer Varianzgruppe angewendet wurde. Die Liste erscheint automatisch, wenn das Register GPS gewählt ist und unter ‘Skalare anwenden’ auf die Option ‘Varianzgruppen’ eingestellt wurde. Weitere Informationen finden Sie unter Gruppen.

Sperren

Klicken Sie auf diese Schaltfläche, um den aktuellen Skalarwert zu sperren.

Sperren Sie den Skalarwert, wenn der Chi-Quadrat Test (Referenzfaktor ~ 1,00) für die Ausgleichung erfolgreich durchgeführt wurde. Wählen Sie dazu den Skalartyp Alternativ, und klicken Sie auf Sperren. Wenn der Skalarwert gesperrt ist, wird der Skalartyp automatisch auf ‘Benutzerdefiniert’ umgestellt, und der Skalar wird im Feld Skalarwert angezeigt. Der Skalartyp ‘Alternativ’ wird nicht länger verwendet.

HINWEIS: Wenn der Skalartyp Automatisch gewählt ist und eine automatische Ausgleichung durchgeführt wird, wird der Skalarwert gesperrt und der Skalartyp auf Benutzerdefiniert geändert.

Die Schaltfläche Sperren ist deaktiviert, wenn die Skalartypen ‘Voreinstellung’ oder ‘Benutzerdefiniert’ verwendet werden.

Anwenden

Klicken Sie auf diese Schaltfläche, um Skalargewichtungsstrategien auf die nächste Ausgleichungsiteration anzuwenden. Sie müssen zuerst den Skalartyp ‘Benutzerdefiniert’ wählen, bevor diese Schaltfläche zur Verfügung steht.

Filter

Klicken Sie auf diese Schaltfläche, um das Dialogfeld Beobachtungsfilter anzuzeigen, das Optionen zum Filtern von Beobachtungen enthält. Das Filtern ist nützlich, wenn Sie eine große Anzahl von Beobachtungen ansehen. Wenn Sie das Dialogfeld verlassen, werden alle Filter automatisch entfernt. Weitere Informationen finden Sie unter Beobachtungen filtern.


    GPS (Gewichtungsstrategien)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie das Register GPS, um Gewichtungsstrategien für GPS-Beobachtungen anzusehen, zu definieren und anzuwenden.

So greifen Sie darauf zu:

1.	Wählen Sie Ausgleichung / Gewichtungsstrategien. Das Dialogfeld Gewichtungsstrategien erscheint.

2.	Wählen Sie das Register GPS.

Ein zusätzlicher Schritt ist erforderlich, um auf die Gewichtungsstrategien für Varianzgruppen zuzugreifen.

So greifen Sie auf die Varianzgruppen-Optionen zu:

  Wählen Sie in der Gruppe Skalare anwenden auf die Option ‘Varianzgruppen’.

Das Dialogfeld ändert sich. Die Liste Beobachtungen wird durch die Gruppenliste ersetzt. Aus dieser Liste können Varianzgruppen gewählt werden, und Gewichtungsstrategien können definiert und auf die Beobachtungen in den Varianzgruppen angewendet werden.


Terrestrisch (Gewichtungsstrategien)

Überblick

Verwenden Sie das Register Terrestrisch, um Gewichtungsstrategien für terrestrische Beobachtungen anzusehen, zu definieren und anzuwenden. Sie können auch auf die Gewichtungsstrategien für Varianzgruppen zugreifen.

So führen Sie dies durch:

1.	Wählen Sie Ausgleichung / Gewichtungsstrategien. Das Dialogfeld Gewichtungsstrategien erscheint.

2.	Wählen Sie das Register Terrestrisch

3.	Wenn Sie auf die Gewichtungsstrategien für Varianzgruppen zugreifen möchten, wählen Sie in der Gruppe Skalare anwenden auf die Option Varianzgruppen.

Die Liste Beobachtungen wird zur Gruppenliste. Aus dieser Liste können Sie die entsprechende Varianzgruppe wählen. Sie können auch die Gewichtungsstrategien definieren und sie auf die in der Varianzgruppe enthaltenen Beobachtungen anwenden.


    Geoid (Gewichtungsstrategien)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Verwenden Sie das Register Geoid, um Gewichtungsstrategien für Geoid-Beobachtungen anzuzeigen, zu definieren und anzuwenden.

So greifen Sie darauf zu:

1.	Wählen Sie Ausgleichung / Gewichtungsstrategien. Das Dialogfeld Gewichtungsstrategien erscheint.

2.	Wählen Sie das Register Geoid.

Prüfen Sie das Register Geoid im Dialogfeld Beobachtungen, wenn keine Beobachtungen in der Liste angezeigt werden. Ein Geoid-Modell muß dem Projekt zugeordnet sein, und die Geoid-Abstände müssen von dem Modell in das Projekt geladen werden.

HINWEIS: Der anfängliche geschätzte Fehler für Geoid-Abstände ist der Standardfehler aus dem Mittel des Beobachtungssatzes. Die Trimble Geomatics Office Software berechnet die Mittel aller Geoid-Abstände in der Ausgleichung und bestimmt aus dem Mittel eines jeden Abstands den mittleren Fehler. Dies ist nur der Ausgangspunkt für die Fehlerschätzung im Geoid-Abstand. Sie müssen die Beobachtungen evtl. skalieren, bevor eine wahrheitsgetreue Darstellung der geschätzten Fehler erreicht werden kann.

HINWEIS: Sie können den mittleren Fehler ändern, indem Sie die minimalen mittleren Fehler für Geoid-Beobachtungen im Dialogfeld Netzausgleichungsstile erhöhen.


    Skalare anwenden auf

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie eine der Optionen in dieser Gruppe, um die Methode zur Anwendung von Skalargewichtungsstrategien auf Beobachtungen oder Varianzgruppen festzulegen.

Folgende Optionen sind verfügbar:

Alle Beobachtungen

Wählen Sie diese Option, um eine einzelne Skalargewichtungsstrategie auf alle aktivierten Beobachtungen eines bestimmten Netzausgleichungstyps (GPS, terrestrisch oder Geoid) basierend auf Fehlern im gesamten Netz anzuwenden. Dies ist die voreingestellte Option für die Netzausgleichung.

Verwenden Sie diese Einstellung, wenn alle Messungen im Netz mit derselben Methode und derselben Ausrüstung durchgeführt wurden. Die Anwendung von Gewichtungsstrategien auf alle Beobachtungen ist ein akzeptabler Vorgang, wenn Sie mit einem einfachen Netz arbeiten.

Wenn der Skalartyp auf ‘Voreinstellung’ festgelegt ist, wird ein voreingestellter Skalar von 1,0 auf alle Beobachtungen angewendet.

Wenn der Skalartyp ‘Alternativ’ eingestellt ist, wird der Gruppen-Referenzfaktor der letzten Ausgleichung mit dem Skalar der letzten Ausgleichung multipliziert. Das Ergebnis wird auf die Fehlerschätzungen für alle Beobachtungen angewendet.

Wenn der Skalartyp ‘Benutzerdefiniert’ eingestellt ist, erscheint der Cursor im Skalarfeld der Gruppenliste und ermöglicht die Eingabe eines Skalarwertes. Der in dieses Feld eingegebene Wert wird bei der nächsten Ausgleichungsiteration auf die Fehlerschätzungen für alle Beobachtungen angewendet.

Wenn der Skalartyp ‘Automatisch’ eingestellt ist, führt die Software eine automatische Ausgleichung unter Verwendung des Skalartyps Alternativ durch. Die Ausgleichung wird so lange wiederholt, bis der Chi-Quadrat Test bestanden ist.

Die Resultate der Gewichtungsstrategien können im Abschnitt Gewichtungsstrategien des Ausgleichungsberichts überprüft werden.

Jede Beobachtung

Wählen Sie diese Option, wenn Sie eine individuelle Gewichtungsstrategie auf die Fehlerschätzungen für jede einzelne aktivierte Beobachtung in der Netzausgleichung anwenden möchten.

HINWEIS: Diese Option ist nur im Register GPS verfügbar.

Verwenden Sie diese Einstellung für Diagnosezwecke, z. B. um schlechte Beobachtungen in einem Netz zu finden. Trimble empfiehlt, diese Methode der Skalargewichtung auf endgültige Netzausgleichungen anzuwenden.

Wenn der Skalartyp auf ‘Voreinstellung’ festgelegt ist, wird ein voreingestellter Skalar von 1,0 auf jede Beobachtung angewendet.

Wenn der Skalartyp ‘Alternativ’ eingestellt ist, wird der Varianzgruppen-Referenzfaktor der letzten Ausgleichung mit dem Skalar der letzten Ausgleichung multipliziert. Das Ergebnis wird auf die Fehlerschätzungen für die einzelnen Gruppenbeobachtungen angewendet.

Die Resultate der Gewichtungsstrategien können im Abschnitt Gewichtungsstrategien des Ausgleichungsberichts überprüft werden.

Varianzgruppen

Verwenden Sie diese Option, um Gewichtungsstrategien auf alle Beobachtungen in einer bestimmten Varianzgruppe anzuwenden.

HINWEIS: Diese Option ist nur verfügbar, wenn das Register GPS oder Terrestrisch im Dialogfeld Gewichtungsstrategien gewählt ist.

Wenn diese Option gewählt ist, wird die Liste der Beobachtungen durch die Gruppenliste ersetzt, die alle Varianzgruppen und deren Skalarwerte enthält.

Wenn der Skalartyp auf ‘Voreinstellung’ festgelegt ist, wird ein voreingestellter Skalar von 1,0 auf alle Beobachtungen in der Varianzgruppe angewendet.

Wenn der Skalartyp ‘Alternativ’ eingestellt ist, wird der Varianzgruppen-Referenzfaktor der zuletzt durchgeführten Ausgleichung mit dem Skalar der letzten Ausgleichung multipliziert. Das Ergebnis wird auf alle Fehlerschätzungen für die Beobachtungen in der Varianzgruppe angewendet.

Wenn der Skalartyp ‘Benutzerdefiniert’ eingestellt ist, erscheint der Cursor im Skalarfeld in der Gruppenliste und ermöglicht die Eingabe eines Skalarwertes. Der in dieses Feld eingegebene Wert wird bei der nächsten Ausgleichungsiteration auf die Fehlerschätzungen für die Beobachtungen in der Varianzgruppe angewendet.

Wenn der Skalartyp ‘Automatisch’ eingestellt ist, führt die Software eine automatische Ausgleichung unter Verwendung des Skalartyps Alternativ durch. Die Ausgleichung wird so lange wiederholt, bis der Chi-Quadrat Test bestanden ist.

Die Resultate der Gewichtungsstrategien können im Abschnitt Gewichtungsstrategien des Ausgleichungsberichts überprüft werden.

Für GPS-Beobachtungen stehen die Optionen ‘Alle Beobachtungen’, ‘Jede Beobachtung’ und ‘Varianzgruppen’ zur Verfügung. Für terrestrische Beobachtungen stehen die Optionen ‘Alle Beobachtungen’ und ‘Varianzgruppen’ zur Verfügung. Für Geoid-Beobachtungen kann nur die Option ‘Alle Beobachtungen’ gewählt werden.

Die folgende Liste enthält mögliche Kombinationen von Gewichtungsstrategien:

Skalartyp	Skalare anwenden auf	Skalarliste
Voreinstellung	Alle Beobachtungen	Es wird keine Gewichtungsstrategie angewendet
	Jede Beobachtung	Es wird keine Gewichtungsstrategie angewendet
	Varianzgruppen	Es wird keine Gewichtungsstrategie angewendet
Alternativ	Alle Beobachtungen	Ein einzelner Skalar wird auf generell auf jeden Beobachtungstyp angewendet
	Jede Beobachtung	Für jede Beobachtung wird ein unterschiedlicher Skalar verwendet
	Varianzgruppen	Ein einzelner Skalar wird für jede Gruppe angewendet
Benutzer-definiert	Alle Beobachtungen	Ein einzelner Skalar wird generell angewendet
	Varianzgruppen	Ein einzelner Skalar wird für jede Gruppe angewendet
Automatisch	Alle Beobachtungen	Ein einzelner Skalar wird generell angewendet
	Varianzgruppen	Ein einzelner Skalar wird für jede Gruppe angewendet


    Skalartyp

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie diese Option, um den Skalartyp auszuwählen, der auf GPS-Beobachtungen, terrestrische Beobachtungen, Geoid-Beobachtungen und Varianzgruppen angewendet werden soll.

Folgende Optionen sind verfügbar:

Voreinstellung

Verwenden Sie diese Option, um einen voreingestellten Skalar von 1,0 mit der in der Gruppe Skalare anwenden auf festgelegten Methode auf Fehlerschätzungen anzuwenden.

Verwenden Sie diesen Typ für die erste Ausgleichungsiteration. Der geschätzte Fehler wird wie berechnet angewendet und ermöglicht es Ihnen, die Fehler im Netz abzuschätzen. Dies ist die Voreinstellung für die erste Ausgleichungsiteration.

HINWEIS: Wenn Sie eine Beobachtung aus der Ausgleichung entfernen, sollten Sie erneut den Skalartyp ‘Voreinstellung’ benutzen.

HINWEIS: Wenn der voreingestellte Skalar für GPS-Beobachtungen verwendet wird, werden die Koordinaten des Startpunkts gespeichert und für alle nachfolgenden Ausgleichungen verwendet, um die Vektoren auf das Ellispoid zu modellieren, bis eine weitere Ausgleichung mit dem voreingestellten Skalar durchgeführt wird.

Die Resultate der Gewichtungsstrategien können im Abschnitt Gewichtungsstrategien des Ausgleichungsberichts überprüft werden.

Alternativ

Verwenden Sie diese Option, um einen Skalar anzuwenden, der aus dem Produkt des Referenzfaktors und des Skalars der zuletzt durchgeführten Ausgleichung berechnet wurde. Der daraus resultierende Skalarwert wird mit der unter ‘Skalare anwenden auf’ festgelegten Methode auf die geschätzten Fehler angewendet. Dies ermöglicht der Trimble Geomatics Office Software die automatische Berechnung des Skalars für die nächste Ausgleichungsiteration.

Der alternative Skalar wird auf die geschätzten Fehler für jede Ausgleichungsiteration angewendet, die Sie durchführen. Dies wird solange wiederholt, bis die Globale Statistik akzeptabel ist (der Chi-Quadrat Test bestanden ist). Sperren Sie den Skalarwert, wenn die Resultate akzeptabel sind, um diesen Skalar auf jede nachfolgende Ausgleichungsiteration anzuwenden.

Die Resultate der Gewichtungsstrategien können im Abschnitt Gewichtungsstrategien des Ausgleichungsberichts überprüft werden.

HINWEIS: Sie sollten versuchen, die Fehlerschätzungen für Ausreißer alternativ zu skalieren, bevor Sie den Ausreißer aus der Ausgleichung entfernen. Sie können so überprüfen, ob die geschätzten Fehler nach der Skalierung akzeptabel sind. Wenn der Ausreißer durch alternatives Skalieren nicht gelöst wird, entfernen Sie ihn, und legen Sie den Skalartyp ‘Voreinstellung’ für die Gewichtungsstrategie fest.

ACHTUNG: Wenn Sie einen alternativen Skalar verwenden, prüfen Sie die Größenordnung des Skalars, wenn die Ausgleichungsiterationen durchgeführt werden. Die Verwendung von extrem großen Skalaren zur Auflösung von Ausreißern ist nicht empfehlenswert.

Benutzerdefiniert

Verwenden Sie diese Option, um einen benutzerdefinierten Skalar mit der unter ‘Skalare anwenden auf’ festgelegten Methode auf die Fehlerschätzungen anzuwenden.

Dieser Typ ist deaktiviert, wenn in der Gruppe ‘Skalare anwenden auf’ die Option ‘Jede Beobachtung’ gewählt wurde.

Der Skalartyp ‘Benutzerdefiniert’ wird automatisch eingestellt, wenn Sie zuvor den Skalartyp ‘Alternativ’ verwendet haben und auf die Schaltfläche Sperren klicken. Der letzte alternative Skalar, der auf die Ausgleichung angewendet wurde, wird im Feld Skalarwert angezeigt und als benutzerdefinierter Skalar verwendet.

Die manuelle Definition eines Skalars erfordert ein umfangreiches Wissen über Vermessungsbeobachtungen und Ausgleichungen der kleinsten Quadrate. Trimble rät von der Verwendung des benutzerdefinierten Skalartyps ab, wenn Sie noch keine Erfahrung im Umgang mit der Trimble Geomatics Office Software besitzen. Weitere Informationen über Vermessungsbeobachtungen und Ausgleichungen der kleinsten Quadrate finden Sie in der Bibliographie.

Automatisch

Wenn der Skalartyp auf Automatisch eingestellt wird, führt die Software unter Verwendung des Skalartyps Alternativ eine automatische Ausgleichung durch (Sie können die Ausgleichung jederzeit abbrechen, indem Sie die Taste ESC drücken).

Die Software wiederholt diese Ausgleichung, bis die globale Statistik akzeptabel ist (bis der Chi-Quadrat Test bestanden ist). Wenn der Chi-Quadrat Test jedoch nach 10 Iterationen noch nicht bestanden ist, wird die Ausgleichung abgebrochen. Eine Warnmeldung erschient, und Sie müssen die in der Ausgleichung verwendeten Daten überprüfen.

Nachdem die automatische Ausgleichung erfolgreich beendet wurde, wird der Skalarwert gesperrt, und der Skalartyp auf Benutzerdefiniert geändert. Eine weitere Ausgleichung wird duchgeführt, und danach können Sie den Netzausgleichungsbericht ansehen. Der Netzausgleichungsbericht gibt an, daß der Skalartyp Benutzerdefiniert verwendet wurde.

HINWEIS: Wenn die automatische Ausgleichung nicht erfolgreich beendet wurde (der Chi-Quadrat Test nicht bestanden ist), gibt der Netzausgleichungsbericht an, daß der Skalartyp Alternativ verwendet wurde.

HINWEIS: Grobe Fehler in den Daten können zu einer extremen Skalierung der Ausgleichungsbeobachtungen führen. Vergewissern Sie sich, daß alle groben Fehler entfernt wurde, bevor Sie den Skalartyp Automatisch verwenden. Sie können die Ausgleichung auf grobe Fehler oder fehlerhafte Daten überprüfen, indem Sie eine Ausgleichung mit dem Skalartyp Voreinstellung durchführen und danach die Ausgleichungsresultate überprüfen.

Überprüfen Sie die Ausgleichungsresultate sorgfältig, nachdem Sie den Skalartyp Automatisch verwendet haben, vor allem die Ausgleichungshistogramme, um sicherzustellen, daß keine groben Fehler in den Beobachtungen enthalten sind.

ACHTUNG: Trimble empfiehlt, den Skalartyp Automatisch nicht für die gleichzeitige Skalierung von GPS- und terrestrischen Beobachtungen zu verwenden.

Informationen über die Bewertung der Resultate der Gewichtungsstrategien finden Sie im Abschnitt Gewichtungsstrategien des Netzausgleichungsberichts.

Folgende Gewichtungsstrategien können angewendet werden:

Skalartyp	Skalare anwenden auf	Skalarliste
Voreinstellung	Alle Beobachtungen	Es wird keine Gewichtungsstrategie angewendet
	Jede Beobachtung	Es wird keine Gewichtungsstrategie angewendet
	Varianzgruppen	Es wird keine Gewichtungsstrategie angewendet
Alternativ	Alle Beobachtungen	Ein einzelner Skalar wird generell angewendet
	Jede Beobachtung	Für jede Beobachtung wird ein unterschiedlicher Skalar verwendet
	Varianzgruppen	Ein einzelner Skalar wird auf jede Gruppe angewendet
Benutzer-definiert	Alle Beobachtungen	Ein einzelner Skalar wird generell angewendet
	Varianzgruppen	Ein einzelner Skalar wird auf jede Gruppe angewendet
Automatisch	Alle Beobachtungen	Ein einzelner Skalar wird generell angewendet
	Varianzgruppen	Ein einzelner Skalar wird für jede Gruppe angewendet

Richtlinien zur Bewertung der Gewichtungsresultate finden Sie im Abschnitt Gewichtungsstrategien des Ausgleichungsberichts.


    Beobachtungen (Gewichtungsstrategien)

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die Liste Beobachtungen, um die Gewichtungsstrategie für jede in der  Netzausgleichung enthaltene Beobachtung anzusehen. Im Dialogfeld Gewichtungsstrategien haben Sie über die Register GPS, Terrestrisch und Geoid Zugang zu unterschiedlichen Variationen dieser Liste.

Wenn jedoch in den Registern GPS und Terrestrisch die Option Varianzgruppen in der Gruppe Skalare anwenden auf eingestellt ist, wird die Liste Beobachtungen automatisch zur Gruppenliste.

Weitere Informationen finden Sie unter folgenden Themen:

  Beobachtungen − GPS-Beobachtungen

  Beobachtungen − Terrestrische Beobachtungen

  Beobachtungen − Geoid-Beobachtungen


Beobachtungen (Gewichtungsstrategien - GPS)
    Beobachtungen (Gewichtungsstrategien − GPS)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie die Liste Beobachtungen, um die Skalargewichtungsstrategien für alle GPS-Beobachtungen in einer Netzausgleichung anzusehen. Sie können die Informationen in der Liste nicht bearbeiten.

Die Beobachtungsliste ist nur verfügbar, wenn unter Skalare anwenden auf die Option ‘Alle Beobachtungen’ oder ‘Jede Beobachtung’ eingestellt wurde. Sie wird automatisch durch die Gruppenliste ersetzt, wenn unter Skalare anwenden auf die Option ‘Varianzgruppen’ gewählt wurde.

TIP: Sie können die Schaltfläche Filter verwenden, um Beobachtungen, die mit unterschiedlichen Vermessungsmethoden aufgezeichnet wurde, zu filtern. Durch das Filtern werden bestimmte Beobachtungstypen zeitweise ausgeblendet. Kürzere Listen erleichtern das Auffinden anderer Beobachtungen. Verwenden Sie das Feld Typ, um die Vermessungsmethoden zu bestimmen, die zur Aufzeichnung der Beobachtungen verwendet wurden. Weitere Informationen finden Sie unter Beobachtungen filtern.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung in der Netzausgleichung zugeordnet wurde. Vor der Datensatznummer steht der Buchstabe ‘B’, der angibt, daß es sich um eine GPS-Beobachtung handelt.
Startpunkt	Der Startpunkt der Beobachtung.
Endpunkt	Der Endpunkt der Beobachtung.
Skalar	Der individuelle Skalar für die Beobachtung.
Typ	Der GPS-Beobachtungstyp.
Varianzgruppe	Die Varianzgruppe, die der Beobachtung zugeordnet wurde. Individuelle GPS-Beobachtungen können nur einer einzigen Varianzgruppe zugeordnet werden – das bedeutet, daß zwar mehrere benutzerdefinierte Gruppen existieren können, aber jede Beobachtung nur einer einzigen Gruppe zugewiesen werden kann.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Beobachtungen (Gewichtungsstrategien - Geoid)
    Beobachtungen (Gewichtungsstrategien − Geoid)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Verwenden Sie diese Liste, um die Geoid-Beobachtungen anzusehen, die in das Projekt geladen wurden. Sie können keine Informationen in der Liste Beobachtungen bearbeiten.

Die Liste ist leer, wenn kein Geoid-Modell für das Projekt gewählt ist und keine Geoid-Abstände geladen wurden.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung in der Netzausgleichung zugeordnet wurde. Vor der Datensatznummer steht der Buchstabe "G", der angibt, daß es sich um eine GPS-Beobachtung handelt.
Punkt	Der Names des Punktes, der zur Erstellung der Geoid-Beobachtung verwendet wurde.
Endpunkt	Der Endpunkt der Beobachtung.
Nächster Skalar	Der nächste Skalarwert, der auf die Beobachtung angewendet wird.
Typ	Der GPS-Beobachtungstyp.
Abstand	Der Geoid-Abstand aus dem Geoid-Modell.
Varianzgruppe	Gibt an, ob die Beobachtung einer Varianzgruppe zugeordnet wurde. Da nur eine Geoid-Varianzgruppe existiert, werden alle Geoid-Beobachtungen der Gruppe <Geoid-Voreinstellung> zugeordnet.  HINWEIS: Die Gruppe <Geoid-Voreinstellung> ist die einzige verfügbare Geoid-Varianzgruppe für alle Netzausgleichungen. Da dieselbe Interpolationsmethode für alle Geoid-Beobachtungen im selben Geoid-Modell verwendet wird, ist es nicht erforderlich, die Beobachtungen in mehrere Gruppen aufzuteilen.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


    Gruppen (Gewichtungsstrategien)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Diese Liste enthält die Varianzgruppen und den Skalarwert, der auf alle Beobachtungen in der Gruppe angewendet wurde.

Diese Liste Gruppen wird verfügbar, wenn die Register GPS oder Terrestrisch im Dialogfeld Gewichtungsstrategien gewählt wurden, und in der Gruppe Skalare anwenden auf die Option ‘Varianzgruppen’ eingestellt ist. Diese Liste steht nicht im Register Geoid zur Verfügung.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Gruppenname	Der Name der Varianzgruppe. Sie können die Informationen in dieser Spalte nicht bearbeiten.
Nächster Skalar	Der nächste Skalarwert, der für die Varianzgruppen verwendet wird. Sie können einen Skalarwert in diese Spalte eingeben, wenn der Skalartyp Benutzerdefiniert gewählt ist. Wenn der Skalartyp auf Voreinstellung oder Alternativ eingestellt ist, können Sie die Informationen in dieser Spalte nicht bearbeiten.

TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.


Beobachtungen (Gewichtungsstrategien - Terrestrisch)
Beobachtungen (Gewichtungsstrategien − Terrestrisch)

Überblick

Diese Liste ist nur verfügbar, wenn in der Gruppe Skalare anwenden auf die Option Alle Beobachtungen eingestellt ist. Sie können Sie verwenden, um die Skalargewichtungsstrategien für alle terrestrischen Beobachtungen in der Netzausgleichung anzusehen. Sie können jedoch keines dieser Felder bearbeiten.

TIP: Sie können die Schaltfläche Filter verwenden, um unterschiedliche Beobachtungstypen zu filtern. Durch das Filtern werden bestimmte Beobachtungstypen zeitweise ausgeblendet. Kürzere Listen erleichtern das Auffinden anderer Beobachtungen.  Weitere Informationen finden Sie unter Beobachtungen filtern.

Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Beob.	Die Datensatznummer, die der Beobachtung in der Netzausgleichung zugeordnet wurde. Der Buchtsabe "T" ist der Datensatznummer vorangestellt, was angibt, daß es sich um eine terrestrische Beobachtung handelt. Der Buchstabe "L" ist Nivellierbeobachtungen vorangestellt.
Rückb.-Punkt	Der Name des Rückblick-Punkts der Beobachtung.
Instr.pkt.	Der Name des Instrumentenpunkts der Beobachtung.
Vorbl.-Punkt	Der Name des Vorblick-Punkts der Beobachtung.
Nächster Skalar	Der nächste Skalar, der auf die Beobachtungen angewendet wird.
Varianzgruppe	Gibt an, ob die Beobachtung einer Varianzgruppe zugeordnet wurde. Obwohl mehrere benutzerdefinierte Gruppen erstellt werden können, kann eine terrestrische Beobachtung nur einer Varianzgruppe zugeordnet werden.
TIP: Die Listenspalten können verschoben werden, die Spaltengröße kann geändert werden, und die Spalten können sortiert werden.

HINWEIS: Nivellier- und Azimut-Beobachtungen werden wie terrestrische Beobachtungen behandelt. Verwenden Sie für diese Beobachtungen den Instrumentenpunkt als Startpunkt und den Vorblick-Punkt als Endpunkt.


    Ausgleichungkopfzeile

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die Kopfzeile am Anfang des Ausgleichungsberichts, um die Projektinformationen anzusehen.

Die Kopfzeile enthält Informationen, die aus den Projekteigenschaften erstellt wurden. Ein Inhaltsabschnitt mit Hyperlinks zur Anzeige der einzelnen Berichtabschnitte wird auf der linken Seite des Bildschirms angezeigt.

So greifen Sie auf diese Statistiken zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet. Der Netzausgleichungsbericht erscheint, an dessen Anfang die Ausgleichungskopfzeile angezeigt wird.

2.	Verwenden Sie die Hyperlinks im Inhaltsabschnitt, um durch den Bericht zu navigieren.

Folgende Felder oder Unterabschnitte sind verfügbar:

Projekt

Dieses Feld enthält die Projektbezeichnung.

Benutzername

Dieses Feld enthält den unter Projekteigenschaften eingegebenen Namen.

Datum & Zeit

Dieses Feld enthält das Datum und den Erstellungszeitpunkt des Berichts.

Koordinatensystem

Dieses Feld enthält das unter Projekteigenschaften gewählte Koordinatensystem.

Zone

Dieses Feld enthält die unter Projekteigenschaften gewählte Koordinatensystemzone. Wenn GPS-Kalibrierung gewählt wurde, wird der Name der örtlichen Anpassung im Feld Zone angezeigt.

Alle veröffentlichten Koordinatensysteme verfügen über eine Zone. Das einzige Koordinatensystem, das keine Zonen enthält, ist die voreingestellte Projektion, bei der die Bezeichnung ‘"Voreinstellung" im Zonenfeld angezeigt wird. Verwenden Sie die Voreinstellung, wenn Sie davon ausgehen, daß die Koordinaten einer Meßstelle z. B. Ho = 10000, Re = 10000 und Hö = 100 sind.

Projektdatum

Dieses Feld enthält das unter Projekteigenschaften gewählte Projektdatum. Es enthält nicht das für die Ausgleichung gewählte Datum.

Vertikales Datum

Sie können dieses Feld zu den Informationen in der Kopfzeile des Netzausgleichungsberichts hinzufügen. Tragen Sie die erforderlichen Details in das Feld Vertikales Datum im Dialogfeld Projekteigenschaften – Register Projektdetails ein, wenn das vertikale Datum angezeigt werden soll.

Geoid-Modell

Dieses Feld enthält das unter Projekteigenschaften zugeordnete Geoid-Modell. Das Feld zeigt ‘Nicht ausgewählt’ an, wenn dem Projekt kein Geoid-Modell zugewiesen wurde.

Koordinateneinheiten

Dieses Feld enthält die Einheiten des unter Projekteigenschaften gewählten Koordinatensystems.

Streckeneinheiten

Dieses Feld enthält die in den Projekteigenschaften gewählten Streckeneinheiten.

Ellips. Höheneinheiten

Dieses Feld enthält die in den Projekteigenschaften gewählten ellipsoidischen Höheneinheiten.

Inhalt

Der Inhaltsabschnitt wird auf der linken Seite des Bildschirms angezeigt und enthält einige oder alle der nachstehenden Sprungmarken:

  Projektdetails

  Ausgleichungsstil-Einstellungen

  Restwert-Toleranzen

  Kovarianz-Anzeige

 Ausgleichungssteuerungen

  Standpunktfehler

  Statistische Zusammenfassung

  GPS-Beobachtungsstatistik

  Geoid-Modell-Statistik

  Terrestrische Beobachtungsstatistik

  Gewichtungsstrategien

  Ausgeglichene Koordinaten

  Gitternetz-Koordinaten

  Geodätische Koordinaten

  Koordinaten-Deltas

  Festpunktkoordinatenvergleiche

  Ausgeglichene Beobachtungen

  GPS-Beobachtungen

  Geoid-Beobachtungen

  Terrestrische Beobachtungen

  Histogramme der standardisierten Restwerte

  Punktfehlerellipsen

  Kovarianzwerte

Verwenden Sie die vorstehenden Hyperlinks, um weitere Informationen zu den einzelnen Berichtabschnitten zu erhalten.


    Ausgeglichene Koordinaten

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um folgendes anzusehen:

  die Anzahl der Punkte

  die Anzahl der Punkte, für die Bedingungen für Koordinatenkomponenten festgehalten wurden

  die Koordinatenwerte bedingter und ausgeglichener Punkte

  die geschätzten mittleren a posteriori Fehler für jeden Punkt der Ausgleichung

  Endgültige Fehlerschätzungen

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung.

Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Koordinaten.

Der Abschnitt Ausgeglichene Koordinaten beginnt mit einem Satz von Feldern, gefolgt von einzelnen Tabellen, die folgendes anzeigen:

  Ausgeglichene Gitternetz-Koordinaten

  Ausgeglichene geodätische Koordinaten

  Ausgeglichene Koordinaten-Deltas

Diese Tabellen enthalten Daten für jeden Punkt in der Netzausgleichung.

Die Statistik enthält folgende Felder:

Ausgleichung durchgeführt in

Dieses Feld enthält das zur Durchführung der Netzausgleichung verwendete Datum. Das WGS-84 Datum sollte für eine minimal bedingte Ausgleichung oder freie Ausgleichung von GPS-Beobachtungen verwendet werden. Wenn das WGS-84 Datum gewählt ist, wird in diesem Feld folgendes angezeigt:

Ausgleichung durchgeführt in WGS-84

Eine vollständig bedingte Ausgleichung wird in der Regel unter Verwendung des Projektdatums durchgeführt. Die Bezeichnung WGS-84 in vorstehend genanntem Beispiel wird im Bericht durch den Namen des Projektdatums ersetzt.

Anzahl Punkte

Dieses Feld enthält die Anzahl der in der Netzausgleichung enthaltenen Punkte.

Anzahl Zwangspunkte

Dieses Feld enthält die Anzahl der bedingten Koordinatenkomponenten.

Die Zwangspunkte sind in die festgehaltenen (bedingten) Koordinatenkomponenten eingeteilt, z. B.:

  Nur horizontal

  Nur ellips. Höhe

  Nur Höhe

  Nur horizontal und ellips. Höhe

  Nur horizontal und Höhe

  Horizontal plus ellips. Höhe und Höhe

Im Anschluß an die vorstehend genannten Felder werden folgende Tabellen angezeigt:

  Ausgeglichene Gitternetz-Koordinaten

  Ausgeglichene geodätische Koordinaten

  Ausgeglichene Koordinaten-Deltas

Weitere Informationen zur Bewertung der in diesen Tabellen enthaltenen Daten finden Sie unter den vorstehend genannten Themen.


    Koordinaten-Deltas

Weitere Informationen

 Siehe auch

Überblick

Diese Tabelle enthält die Größenordnung der Koordinatenverschiebung (Ausgleichung) der Punktkoordinaten der zuletzt durchgeführten Ausgleichung.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Koordinaten - Deltas.

Die Statistik Koordinaten-Deltas wird angezeigt.

Diese Statistik enthält alle Punkte in der Ausgleichung und die Verschiebung, die bei der zuletzt durchgeführten Ausgleichung auf jede Komponente angewendet wurde. Die Deltas werden in linearen Einheiten angegeben, basierend auf den für das Projekt ausgewählten Koordinateneinheiten.

Informationen über Koordinaten-Deltas sind besonders nützlich, wenn eine vollständig bedingte Ausgleichung durchgeführt wurde, vor allem bei der Bewertung von Anomalien in den Koordinatenverschiebungen.

Diese Spalten enthalten:

Spalte	Zeigt die Ausgleichung (Verschiebung) an für die/den…
Punktname	−
ΔHochwert	Hochwert-Koordinatenkomponente
ΔRechtswert	Rechtswert-Koordinatenkomponente
ΔHöhe	Orthometrische Höhe der Koordinate
ΔEllips. Höhe	Ellipsoidische Höhe der Koordinate
ΔGeoid-Abstand	Geoid-Abstand, wenn ein Geoid-Modell definiert ist und Abstände in das Projekt geladen wurden. Dieses Feld ist leer, wenn keine Geoid-Abstände zur Verfügung stehen.


    Kovarianzwerte

Weitere Informationen

 Siehe auch

Überblick

Diese Statistik enthält die relative Liniengenauigkeit (Kovarianzwerte) zwischen Punkten in der Ausgleichung.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung.

Das voreingestellte HTML-Anzeigemodul wird gestartet und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Kovarianzwerte.

Die Statistik der Kovarianzwerte wird angezeigt.

Die Anzahl der angezeigten Kovarianzwerte variiert in Abhängigkeit von den Allgemeinen Eigenschaften, die im Ausgleichungsstil definiert wurden.

  Alle Linien – Wenn Sie die Kontrollkästchen ‘Reduziertes Spaltenprofil verwenden‘ und ‘Kovarianzwerte auf beobachtete Linien beschränken‘ deaktivieren, werden alle Azimute, Delta Ellipsoid-Höhen, Strecken und Delta Höhen mit den assoziierten Fehlern zwischen allen Punkten im Netz angezeigt.

  Beobachtete Linien – Wenn Sie die Kontrollkästchen für die Optionen ‘Reduziertes Spaltenprofil verwenden‘ und ‘Kovarianzwerte auf beobachtete Linien beschränken‘ wählen, werden nur die Azimute, Delta Ellipsoid-Höhen, Delta Höhen und Strecken mit den assoziierten Fehlern für die beobachteten Linien angezeigt.

Weitere Informationen zum Ändern des Inhalts dieser Statistik finden Sie unter Kovarianz-Anzeige.

Verwenden Sie diese Genauigkeitsstatistik, um den relativen Fehler eines beliebigen Punktepaars im Netz abzulesen. Folgende Spalten sind verfügbar:

Spalte	Was angezeigt wird
Von Punkt	Der Startpunkt für die relativen Kovarianzwerte
Zu Punkt	Der Endpunkt für die relativen Kovarianzwerte.
Komponenten	Die Komponenten der relativen Linie zwischen den Punkten
A-posteriori Fehler (   )	Die a posteriori Fehler der Beobachtungskomponenten. Der im Ausgleichungsstil gewählte Vertrauensgrad wird in Klammern angezeigt und zur Berechnung der a posteriori Fehlerschätzungen verwendet.
Horiz. Genauigkeit  (    )	Die zweidimensionale oder horizontale Genauigkeit der Kovarianzwerte. In den Klammern wird angegeben, ob die Genauigkeit in PPM oder als Verhältnis dargestellt ist.
3D-Genauigkeit (    )	Die dreidimensionale Genauigkeit der Kovarianzwerte. In den Klammern wird angegeben, ob die Genauigkeit in PPM oder als Verhältnis dargestellt ist.


    Histogramme der standardisierten Restwerte

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Histogramme, um folgende Informationen anzusehen:

  die Häufigkeitsverteilung der standardisierten Restwerte

  die in den Beobachtungen enthaltenen Ausreißer

  die Normalverteilungskurve

  der kritische Tau-Wert

So greifen Sie auf diese Histogramme zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Histogramme der standardisierten Restwerte.

Die Histogramme der standardisierten Restwerte erscheinen.

Diese Histogramme beinhalten:

  Kombiniert – den kombinierten Plot der standardisierten Restwerte der horizontalen und vertikalen Beobachtungen

  Horizontal – den Plot der standardisierten Restwerte der horizontalen Beobachtungen

  Vertikal – den Plot der standardisierten Restwerte der vertikalen Beobachtungen

Histogramme sind graphische Darstellungen der Häufigkeitsverteilung der standardisierten Beobachtungsrestwerte der zuletzt durchgeführten Ausgleichung. Die Statistik Ausgeglichene Beobachtungen enthält die standardisierten Restwerte für jede Beobachtung.

Die vertikale Linie in der Mitte ist der Null-Restwert. Basierend auf der Normalverteilung sind die kleinsten Restwerte um diesen Wert angeordnet und zeigen die größte Häufigkeit der geplotteten Restwerte an. Die größeren Restwerte sind weiter von der Null-Linie entfernt und haben eine geringere Häufigkeitsverteilung.

Wenn die Ausgleichungsrestwerte zufällig verteilt sind, nähert sich der Häufigkeitsverteilungs-Plot der Normalverteilungskurve an. Die Kurve ist in der Darstellung über den Restwerte-Plot gelegt.

Die vertikalen Linien links und rechts der Null-Linie zeigen den kritischen Tau-Wert an. Alle standardisierten Restwerte, die sich außerhalb dieser Linien befinden, werden als Ausreißer angesehen. Der Balkenmaßstab stellt den Sigma-Wert dar. Der Sigma-Wert stimmt mit dem Tau-Wert in der Statistik Ausgeglichene Beobachtungen überein.


    Individuelle GPS-Beobachtungsstatistik

Weitere Informationen

 Siehe auch

Überblick

Diese Statistik enthält die Beobachtungs-ID, den Referenzfaktor und die Redundanzzahl (Freiheitsgrade) für jede Beobachtung, die in der Ausgleichung verwendet (eingeschlossen) wurde.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung – GPS-Beobachtung.

Eine Beispielstatistik wird nachstehend angezeigt:

Beobachtungs-ID	Referenzfaktor	Redundanzzahl
BL1	1,56	2,03
BL2	0,96	1,88
BL3	1,21	1,66
BL4	2,06	1,93

Die Statistik enthält folgende Felder:

Beobachtungs-ID

Verwenden Sie dieses Feld, um die Nummer des Projektdatensatzes abzulesen, der der Beobachtung zugeordnet wurde. Die Datensatznummer enthält die Buchstaben ‘BL’, gefolgt von einer oder mehreren Zahlen.

Referenzfaktor

Verwenden Sie dieses Feld, um abzulesen, in welchem Umfang der Referenzfaktor der einzelnen Beobachtungen zum Referenzfaktor der GPS-Beobachtungsstatistik beiträgt.

HINWEIS: Die Referenzfaktoren aller individuellen Beobachtungen werden bei der Berechnung des Referenzfaktors aller GPS-Beobachtungen berücksichtigt. Der letztere Wert wird, zusammen mit dem Referenzfaktor für Geoid-Beobachtungen, zur Berechnung des Netz-Referenzfaktors verwendet.

Redundanzzahl

Verwenden Sie dieses Feld, um abzulesen, in welchem Umfang die Redundanz der einzelnen GPS-Beobachtungen zur GPS-Beobachtungsstatistik beiträgt. Sie können aus diesem Feld auch ersehen, ob eine bestimmte GPS-Beobachtung keine Redundanz enthält. Die Redundanzzahl der GPS-Beobachtungsstatistik wird zusammen mit der Redundanzzahl der Geoid-Beobachtungen zur Berechnung der Freiheitsgrade des Netzes verwendet.

Beachten Sie folgende Richtlinien:

  Bewerten Sie die individuelle Beobachtungsstatistik, nachdem Sie den Netz-Referenzfaktor und die Freiheitsgrade im Abschnitt Globale Statistik bewertet haben. Alle individuellen Referenzfaktoren sollten um 1,0 angeordnet sein.

  Achten Sie bei der Bewertung der Liste auf Konsistenz. Berücksichtigen Sie alle extremen Werte, die über oder unter 1,0 liegen. Entfernen Sie Ausreißer aus der Ausgleichung, um eine größere Konsistenz in der Statistik der individuellen Referenzfaktoren zu erhalten.

  Aus den individuellen Redundanzzahlen kann die Redundanz abgelesen werden, die jede Beobachtung zu den allgemeinen Freiheitsgraden für das Netz beiträgt.

  Ale Zahlen sollten größer als 0,00 und kleiner/gleich 3,00 sein.

  Je näher die Redundanzzahl bei 3,00 liegt, desto größer ist die Redundanz, die die Beobachtung zur allgemeinen Redundanz des Netzes beiträgt.

  Eine Redundanzzahl von 0,00 weist darauf hin, daß die Beobachtung nur mit einem Ende einer anderen Beobachtung verknüpft ist. In der Vermessung wird dies als Polarpunkt bezeichnet. Prüfen Sie, warum die Beobachtung nicht zur allgemeinen Redundanz des Netzes beiträgt, wenn die Erzeugung des Polarpunktes nicht beabsichtigt war.

HINWEIS: Der mit einem Polarpunkt verbundene Status einer Beobachtung kann auf die Option ‘Als Prüfpunkt aktivieren’ eingestellt werden.


    Anzahl Iterationen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die in diesem Feld angezeigte Meldung, um die Anzahl der Iterationen anzusehen, die für die Konvergenz des Netzes erforderlich waren.

So greifen Sie auf diese Meldung zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Das Feld Anzahl Iterationen wird angezeigt.

Alle potentiellen Meldungen werden nachstehend aufgeführt:

Erfolgreiche Ausgleichung in # Iteration(en)

Erfolgreiche Ausgleichung in # Iteration(en) (endgültiger Konvergenz-Grenzwert verwendet)

(# = die Anzahl der Iterationen)

Die Anzahl der im Bericht enthaltenen Iterationen überschreitet nie die Maximalen Iterationen, die im Dialogfeld Ausgleichungsstil bearbeiten festgelegt wurden.

HINWEIS: Falls eine Ausgleichung nicht konvergiert, wird kein Bericht erstellt.


    Ausgeglichene Beobachtungen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um Informationen über ausgeglichene GPS- und Geoid-Beobachtungen anzusehen:

  das in der Ausgleichung verwendete Datum

  der in der Ausgleichung verwendete kritische Tau-Wert

  Beobachtungskomponenten mit ihrem assoziierten (geschätzten) mittleren a posteriori Fehler, den Restwert und die standardisierten Restwerte

  Beobachtungskomponenten, die als Ausreißer gekennzeichnet sind

  Transformationsparameter mit ihren assoziierten Fehlerschätzungen (vollständig bedingte Ausgleichung)

  Eine Zusammenfassung der in der Ausgleichung verwendeten Beobachtungen sowie eine Liste aller Beobachtungen (GPS-, terrestrische und Geoid-Beobachtungen)

Verwenden Sie die Beobachtungstabellen der GPS-, terrestrischen und Geoid-Beobachtungen, um:

  die Anzahl der in der Ausgleichung verwendeten Beobachtungen zu überprüfen

  die mittleren a posteriori Fehler einer jeden Beobachtungskomponente zu bewerten

  die Beobachtungskomponenten zu identifizieren, die das für das Netz definierte kritische Tau überschreiten (Ausreißer). Unzuverlässige Beobachtungen (Ausreißer) sind rot markiert

  alle unerwarteten Transformationen und extrem große Fehlerschätzungen in Parametern zu identifizieren

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Beobachtungen.

Die Statistik Ausgeglichene Beobachtungen wird angezeigt.

Dieser Abschnitt ist in drei Unterabschnitte unterteilt:

  GPS

  Terrestrisch

  Geoid

HINWEIS: Sie können Beobachtungen in der Vermessungsansicht im Netzausgleichungsbericht wählen. Wählen Sie dazu die Beobachtungs-ID im Netzausgleichungsbericht (verwenden Sie die Taste Strg, um mehrere Beobachtungen zu wählen). Wenn eine Beobachtung im Bericht gewählt wird, wird die aktuelle Auswahl in der Vermessungsansicht rückgängig gemacht und durch die im Bericht gewählten Beobachtung(en) ersetzt.


    Punktfehlerellipsen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um eine graphische Darstellung des Ausmaßes und der Richtung der horizontalen und vertikalen Punktfehler anzusehen. Punktfehlerellipsen sind eine graphische Darstellung der mittleren a posteriori Fehler der horizontalen Koordinate eines Ausgleichungspunktes und des Kovarianzwertes zwischen Punkten.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Punktfehlerellipsen.

Die Statistik Punktfehlerellipsen wird angezeigt.

Beachten Sie folgende Richtlinien:

  Der obere Teil der Ellipse ist nach Norden ausgerichtet.

  Die Pfeile rechts von der Ellipse stellen die mittleren a posteriori Fehler für die ellipsoidischen und die orthometrischen Höhen dar.

  Die durch die Ellipse verlaufenden Maßstabsleisten und die Pfeile weisen auf die Größe des Fehlers hin.

  Der Wert der Maßstabsmarkierung wird, ebenso wie die Fehlerellipsen, in den Projekteinheiten angezeigt. Sie können den Wert der Maßstabmarkierung mit Hilfe der Ellipsenparameter-Symbolleiste im Graphikfenster ändern, um die Maßstabsauflösung zu ändern. Die Ellipsenparameter-Symbolleiste beeinflußt nicht den Maßstab der Fehlerellipsen im Netzausgleichungsbericht.

  Die Orientierung der großen Halbachse (der Achse, die in die Richtung des größten Fehlers weist) wird im unteren linken Teil der Ellipse dargestellt. Dieser Winkel wird gegen den Uhrzeigersinn von der nach rechts weisenden positiven Achse gemessen.

  Die mittleren Fehler der horizontalen und vertikalen Koordinaten werden mit den entsprechenden bivariaten und den univariaten Sigma-Skalaren multipliziert.


    Statistische Zusammenfassung

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diesen Berichtabschnitt, um Zugang zu der statistischen Zusammenfassung zu erhalten. So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Die Statistische Zusammenfassung erscheint.

Die statistische Zusammenfassung ist ein wichtiges Hilfsmittel bei der Analyse der Ausgleichungsergebnisse. Sie enthält Informationen über folgende wichtige Berichtsabschnitte:

  Anzahl Iterationen

  Globale Statistik

  Statistik für Beobachtungstypen

  Varianzgruppen-Statistik

  Gewichtungsstrategien

  Individuelle GPS-Beobachtungsstatistik

Normalerweise würden Sie sich direkt die statistische Zusammenfassung (vor allem die Globale Statistik) ansehen, um die allgemeinen Resultate einer minimal bedingten Ausgleichung zu prüfen. Der Chi-Quadrat Test, der Netz-Referenzfaktor und die Freiheitsgrade im Abschnitt Globale Statistik sind Schlüsselwerte, die über die Qualität des Netzes Auskunft geben.


    Varianzgruppen-Statistik

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die Zusammenfassung Varianzgruppen-Statistik, um den für jede Varianzgruppe festgelegten Referenzfaktor und die Redundanzzahl (Freiheitsgrade) anzusehen.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsverzeichnis auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Die Varianzgruppenstatistik für jeden Beobachtungstyp kann angesehen werden.

Folgende Felder sind für jede einzelne Varianzgruppe enthalten:

Gruppenname

Dieses Feld enthält die Varianzgruppenbezeichnung.

Referenzfaktor

Dieses Feld gibt an, in welchem Umfang die einzelnen Varianzgruppen zum Netz-Referenzfaktor beitragen. Jede Varianzgruppe hat ihre eigenen geschätzten Fehler und somit auch ihren eigenen Referenzfaktor.

Redundanzzahl

Dieses Feld gibt an, in welchem Umfang die Redundanz der einzelnen Varianzgruppen zu den Freiheitsgraden des Netzes beiträgt. Verwenden Sie dieses Feld, um zu prüfen, ob eine Varianzgruppe keine Redundanz enthält.


    Gewichtungsstrategien

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um zu prüfen, ob die korrekte Skalierungsmethode, der korrekte Skalartyp und der korrekte Skalarwert auf einen Satz von GPS-Beobachtungen, Geoid-Beobachtungen oder Varianzgruppen angewendet wurden.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsverzeichnis auf der linken Seite des Bildschirms auf Gewichtungsstrategien.

Die Statistik Gewichtungsstrategien wird angezeigt.

Für jeden Satz von GPS-Beobachtungen, Geoid-Beobachtungen, terrestrische Beobachtungen und Varianzgruppen werden separate Zusammenfassungen erstellt, die aus einem Titel, einem beschreibenden String und einem Skalarfeld bestehen. Nachstehend wird eine Beispielzusammenfassung für GPS-Beobachtungen, terrestrische Beobachtungen und Geoid-Beobachtungen dargestellt:

GPS-Beobachtungen
Voreingestellter Skalarsatz angewandt auf alle Beobachtungen
Skalar: 1,00

Das vorstehend genannte Beispiel gibt an, das der Skalartyp ‘Voreinstellung‘ mit einem voreingestellten Skalarwert von 1,0 auf Alle GPS-Beobachtungen angewendet wurde. Diese Felder sind, wie nachstehend beschrieben, im Berichtsabschnitt Gewichtungsstrategien enthalten. Bitte beachten Sie, daß unterschiedliche Kombinationen dieser Zusammenfassungen im Bericht erscheinen können, abhängig von der Anzahl der Beobachtungsgruppen und den unterschiedlichen Gewichtungsstrategien, die auf Beobachtungssätze angewendet wurden.

Der Bezug zwischen den Feldern Titel, String und Skalar ist nachstehend dargestellt:

Titel	GPS-Beobachtungen
String	Voreingestellter Skalarsatz angewandt auf alle Beobachtungen
Skalarfeld	Skalar: 1,00

Titel

In vorstehend genanntem Beispiel ist ‘GPS-Beobachtungen‘ der Titel eines Satzes von Gewichtungsstrategien, der auf alle GPS-Beobachtungen angewandt wurde. Die Titel der einzelnen in der Ausgleichung verwendeten Beobachtungsgruppen werden im Abschnitt Gewichtungsstrategien angezeigt.

Skalare anwenden auf/Skalartyp

Das erste Feld der Zusammenfassung eines jeden Beobachtungssatzes ist ein String, der den verwendeten Skalartyp und die Option zur Anwendung der Skalare auf den Beobachtungssatz enthält. Der String steht direkt unterhalb des Beobachtungssatz-Titels. In dem vorstehenden Beispiel ist der Titel des Beobachtungssatzes ‘GPS-Beobachtungen’ und der String ist ‘Voreingestellter Skalar angewandt auf alle Beobachtungen’.

Die vier Worte ‘Skalar angewandt auf‘ sind immer in einem String enthalten. Dem String ist der verwendete Skalartyp vorangestellt. Die Option, die unter Skalare anwenden auf eingestellt wurde, ist nachgestellt. Diese Einstellungen werden im Dialogfeld Gewichtungsstrategien definiert. Mögliche String-Kombinationen für unterschiedliche Beobachtungssätze sind nachstehend aufgelistet:

  Voreingestellter Skalar angewandt auf alle Beobachtungen

  Alternativer Skalar angewandt auf alle Beobachtungen

  Benutzerdefinierter Skalar angewandt auf alle Beobachtungen

  Voreingestellter Skalar angewandt auf Jede Beobachtung

  Alternativer Skalar angewandt auf Jede Beobachtung

  Voreingestellter Skalar angewandt auf Varianzgruppen

  Alternativer Skalar angewandt auf Varianzgruppen

  Benutzerdefinierter Skalar angewandt auf Varianzgruppen

HINWEIS: Der Skalartyp Automatisch führt mehrere Iterationen mit dem alternativen Skalar durch. Wenn der Skalartyp Automatisch gewählt und die Ausgleichung erfolgreich beendet wurde, wird der Skalar Benutzerdefiniert in den vorstehenden Meldungen angeziegt. Ist die automatische Ausgleichung nicht erfolgreich (der Chi-Quadrat Test nicht bestanden), wird der alternative Skalar in den vorstehenden Meldungen angezeigt.

Überprüfen Sie, ob die korrekten Gewichtungsstrategien im String enthalten sind, und verwenden Sie das nachstehend beschriebene Skalarfeld, um festzustellen, ob der korrekte Skalar auf jeden Beobachtungssatz oder auf jede Varianzgruppe angewendet wurde.

Skalarfeld

Das Skalarfeld enthält den Skalarwert, der auf jeden Beobachtungssatz angewendet wurde. Abhängig davon, wie viele Beobachtungsgruppen Ihre Ausgleichung enthält, können mehrere dieser Felder in dem Bericht angezeigt werden. Jeder String und Skalarwert stellen zusammengenommen die Gewichtungsstrategie dar, die auf den entsprechenden Beobachtungssatz angewandt wurde.

Bewerten Sie jedes dieser Felder, um herauszufinden, ob die auf den entsprechenden Beobachtungssatz angewandten Skalarwerte akzeptabel sind. Da unterschiedliche Kombinationen von Gewichtungsstrategien auf unterschiedliche Beobachtungssätze angewendet werden können, kann dieser Berichtsabschnitt auch verschiedene Stringpaare und Skalarwerte enthalten. Sie müssen jeden dieser Feldersätze als Gruppe bewerten.


    Gitternetz-Koordinaten

Weitere Informationen

 Siehe auch

Überblick

Diese Statistik enthält die ausgeglichenen Gitter-Koordinaten der einzelnen in der Ausgleichung verwendeten Punkte. Die Koordinaten enthalten die mittleren a posteriori Fehler (multipliziert mit dem univariaten Sigma-Skalar) für jede Koordinatenkomponente. Der im Ausgleichungsstil gewählte univariate Fehler wird am Anfang der Koordinatenliste angezeigt.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Koordinaten - Gitter.

Die Statistik Ausgeglichene Gitternetz-Koordinaten wird angezeigt.

Sie enthält folgende Spalten:

Spalte	Was angezeigt wird
Punktname	Der Name des Punktes, der in den restlichen Spalten beschrieben wird.
Hochwert	Die ausgeglichene Hochwert-Komponente des Punktes, angegeben in Koordinatensystemeinheiten.
Ho Fehler	Der für den ausgeglichenen Hochwert berechnete Fehler, angegeben in Projekteinheiten.
Rechtswert	Die ausgeglichene Rechtswert-Komponente des Punktes, angegeben in Koordinatensystemeinheiten.
Re Fehler	Der für den ausgeglichenen Rechtswert berechnete Fehler, angegeben in Projekteinheiten.
Höhe	Die ausgeglichene orthometrische Höhe des Punktes, angegeben in Projekteinheiten.
h Fehler	Der für die ausgeglichene orthometrische Höhe berechnete Fehler, angegeben in Projekteinheiten.
Festhalten	Die bedingten Punkte der Ausgleichung und die bedingte Koordinatenkomponente. Bedingte Koordinatenkomponenten sind entweder nur horizontal (2D), nur vertikal (ellipsoidische oder orthometrische Höhe) oder horizontal und vertikal.
Folgende Codes erscheinen in der Spalte, um die Komponenten zu identifizieren:

Code	Bedeutung
Ho Re	Horizontal 2D
h	Orthometrische Höhe
ellh	Ellipsoidische Höhe

HINWEIS: Nicht alle bedingten Punkte enthalten einen mittleren a posteriori Fehler für die Koordinatenkomponente. Diese Fehler werden als 0,000 angezeigt. Wenn für eine Komponente oder für die a posteriori Fehler kein Wert verfügbar ist, wird ‘Nicht vorhanden‘ in der Spalte angezeigt.


    Geodätische Koordinaten

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um die ausgeglichenen geodätischen Koordinaten der einzelnen Punkte in der zuletzt durchgeführten Ausgleichung anzusehen. Die Koordinaten beinhalten die mittleren a posteriori Fehler der einzelnen Koordinatenkomponenten, multipliziert mit dem univariaten Sigma-Skalar.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Koordinaten - Geodätisch.

Die Statistik Ausgeglichene geodätische Koordinaten wird angezeigt.

Sie enthält folgende Spalten:

Spalte	Was angezeigt wird
Punktname	Die Bezeichnung des Punktes, der in den anderen Spalten beschrieben wird.
Breitengrad	Die ausgeglichene Breitengrad-Koordinate des Punktes.
Ho Fehler	Der für die Breitengrad-Koordinate berechnete Fehler, angegeben in Projekteinheiten.
Längengrad	Die ausgeglichene Längengrad-Koordinate des Punktes.
Re Fehler	Der für die Längengrad-Koordinate berechnete Fehler, angegeben in Projekteinheiten.
Ellips Höhe	Die ausgeglichene ellipsoidische Höhen-Koordinate des Punktes, angegeben in Projekteinheiten.
ellh Fehler	Der für die ellipsoidische Höhen-Koordinate berechnete Fehler, angegeben in Projekteinheiten.
Festhalten	Die bedingten Punkte und die bedingte Koordinatenkomponente in der Ausgleichung. Bedingte Koordinatenkomponenten sind entweder nur horizontal (2D), nur vertikal (ellipsoidische oder orthometrische Höhe) oder horizontal und vertikal.

Folgende Codes erscheinen in der Spalte Festhalten, um die Komponenten zu identifizieren:

Code	Bedeutung
Br, Lä	Horizontal 2D
ellh	Ellipsoidische Höhe
h	Orthometrische Höhe

HINWEIS: Nicht alle bedingten Punkte enthalten einen mittleren a posteriori Fehler für die Koordinatenkomponente. Diese Fehler werden als 0,000 angezeigt. Wenn für eine Komponente oder für die a posteriori Fehler kein Wert verfügbar ist, wird ‘Nicht vorhanden‘ in der Spalte angezeigt.


    Globale Statistik

Weitere Informationen

 Siehe auch

Überblick

Diese Statistik gibt Auskunft über die Qualität des Netzes.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Die Globale Statistik wird angezeigt.

Ein Beispiel eines Berichtabschnitts ist nachstehend abgebildet:

Netz-Referenzfaktor :	6,42
Chi-Quadrat Test (a=95%) :	ZURÜCKW.
Freiheitsgrade         :	36,00

Er enthält folgende Felder:

Netz-Referenzfaktor

Dieser Wert gibt an, wie gut die a priori Fehler (Fehler vor der Durchführung der Ausgleichung) mit den a posteriori Fehlern (Fehlern nach durchgeführter Ausgleichung) übereinstimmen.

Einfach ausgedrückt ist der Netz-Referenzfaktor nützlich, um festzustellen, ob die in den Beobachtungen enthaltenen Zufallsfehler akzeptabel sind und ob sie mit den geschätzten mittleren Fehlern für diese Beobachtungen übereinstimmen. Der Netz-Referenzfaktor sollte ungefähr bei 1,0 liegen.

Chi-Quadrat Test

Dieser Wert gibt Auskunft über die Qualität des Ausgleichungsnetzes. Wenn der Referenzfaktor nahe 1,0 liegt und die Freiheitsgrade akzeptabel sind, hat das Netz eine gute mathematische Qualität und der Chi-Quadrat Test ist bestanden.

Bei der Durchführung einer erfolgreichen Ausgleichung der kleinsten Quadrate ist der mathematische Abschluß des Netzes ein wichtiger Faktor. Betrachten Sie den Chi-Quadrat Test als ersten Indikator für den mathematischen Abschluß eines Netzes.

Freiheitsgrade

Dieser Wert gibt die allgemeine Redundanz des Netzes an. Die Freiheitsgrade geben die Anzahl der in der Ausgleichung enthaltenen unabhängigen Beobachtungen an, die zur Erstellung überbestimmter Lösungen verwendet wurden. Je größer die Zahl, desto größer ist die Redundanz in Ihrem Netz.

Die Redundanzzahlen für GPS-Beobachtungen, terrestrische Beobachtungen und Geoid-Beobachtungen werden zusammen verwendet, um die Freiheitsgrade für das Netz zu bestimmen.


    Statistik für Beobachtungstypen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um den Referenzfaktor (RF) und die Redundanzzahl (Freiheitsgrade) zu ermitteln, die für jeden Beobachtungstyp (GPS, terrestrisch oder Geoid) bestimmt wurden.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung.

Die Abschnitte mit der Statistik der GPS-, terrestrischen oder Geoid-Beobachtungen erscheinen.

Geoid-Modell-Statistiken sind verfügbar, wenn Geoid-Beobachtungen geladen wurden.

Weitere Informationen finden Sie unter folgenden Themen:

  GPS-Beobachtungsstatistik

  Terrestrische Beobachtungsstatistik

  Geoid-Modell-Statistik


    GPS-Beobachtungsstatistik

Weitere Informationen

 Siehe auch

Überblick

Sehen Sie sich den Referenzfaktor und die Redundanzzahl (Freiheitsgrade) für GPS-Beobachtungen in der Zusammenfassung der GPS-Beobachtungsstatistik, die in der Statistik für Beobachtungstypen enthalten ist, an.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung – GPS-Beobachtung.

Die Statistik für GPS-Beobachtungstypen wird angezeigt. Die GPS-Beobachtungsstatistik steht am Abschnittsbeginn.

Sie enthält folgende Felder:

Referenzfaktor

Jeder Beobachtungstyp hat seine eigenen geschätzten Fehler und daher auch seinen eigenen Referenzfaktor. Dieser Wert gibt an, in welchem Umfang die Beobachtungstypen zum Netz-Referenzfaktor beitragen. In der Trimble Geomatics Office Software können Sie mit jeder Beobachtungsmethode (GPS, terrestrisch oder Geoid) getrennt arbeiten, um jede Beobachtungsgruppe getrennt zu gewichten und dann den entsprechenden Skalierungsbetrag auf die Fehlerschätzungen in jeder Gruppe anzuwenden.

Redundanzzahl

Die Redundanzzahl, mitunter auch als Freiheitsgrade bezeichnet, ist ein Indikator dafür, in welchem Umfang jede Beobachtung zur allgemeinen Redundanz beiträgt. Verwenden Sie diese Statistik, um festzustellen, welche Beobachtungen keine Redundanz enthalten.

Varianzgruppen-Statistik

Die folgenden Felder werden für jede Varianzgruppe angezeigt:

  Gruppenname

  Referenzfaktor − Dieses Feld gibt an, in welchem Umfang jede Varianzgruppe zum Netzreferenzfaktor beiträgt. Jede Varianzgruppe hat ihre eigenen geschätzten Fehler und daher auch ihren eigenen Referenzfaktor.

  Redundanzzahl  − Diese Feld gibt an, in welchem Umfang jede Varianzgruppe zu den Freiheitsgraden im Netz beiträgt. Verwenden Sie dieses Feld, um festzustellen, welche Varianzgruppen keine Redundanz enthalten.

Individuelle GPS-Beobachtungsstatistik

Folgende Felder werden für GPS-Beobachtungen angezeigt:

  Beobachtungs-ID

  Referenzfaktor − Dieses Feld gibt an, in welchem Umfang jede GPS-Beobachtung zum Netzreferenzfaktor beiträgt. Jede GPS-Beobachtung hat ihre eigenen geschätzten Fehler und daher auch ihren eigenen Referenzfaktor.

  Redundanzzahl  − Diese Feld gibt an, in welchem Umfang jede GPS-Beobachtung zu den Freiheitsgraden im Netz beiträgt. Verwenden Sie dieses Feld, um festzustellen, welche GPS-Beobachtungen keine Redundanz enthalten.


Terrestrische Beobachtungsstatistik

Überblick

Verwenden Sie die Zusammenfassung Terrestrische Beobachtungsstatistik in der Statistik für Beobachtungstypen, um den Referenzfaktor und die Redundanzzahl (Freiheitsgrade), die für terrestrischen Beobachtungen bestimmt wurden, zu überprüfen.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung – Terrestrische Beobachtung.

Die Statistik Terrestrische Beobachtungen erscheint.

Sie enthält folgende Felder:

Referenzfaktor

Jede Beobachtung hat ihre eigenen geschätzten Fehler und daher auch ihren eigenen Referenzfaktor. Dieser Wert gibt an, in welchem Umfang die Beobachtungstypen zum Netz-Referenzfaktor beitragen. In der Trimble Geomatics Office Software können Sie mit jeder Beobachtungsmethode (GPS, terrestrisch oder Geoid) getrennt arbeiten, um jede Beobachtungsgruppe getrennt zu gewichten und dann den entsprechenden Skalierungsbetrag auf die Fehlerschätzungen in jeder Gruppe anzuwenden.

Redundanzzahl

Die Redundanzzahl, mitunter auch als Freiheitsgrade bezeichnet, ist ein Indikator dafür, in welchem Umfang jede Beobachtung zur allgemeinen Redundanz beiträgt. Verwenden Sie diese Statistik, um festzustellen, welche Beobachtungen keine Redundanz enthalten.

Terrestrische Statistik nach Typ

Wenn folgende Beobachtungstypen vorhanden sind, werden die entsprechenden Referenzfaktoren und Redundanzzahlen angezeigt:

  Horizontale Winkel

  Trigonometrische Höhen

  Ellipsoid-Strecken

  Höhenunterschiede

  Azimute

Terrestrische Varianzgruppenstatistik

Folgende Felder sind für jede Varianzgruppe enthalten:

  Gruppenname

  Referenzfaktor − Dieses Feld gibt an, in welchem Umfang jede Varianzgruppe zum Netzreferenzfaktor beiträgt. Jede Varianzgruppe hat ihre eigenen geschätzten Fehler und daher auch ihren eigenen Referenzfaktor.

  Redundanzzahl  − Diese Feld gibt an, in welchem Umfang jede Varianzgruppe zu den Freiheitsgraden im Netz beiträgt. Verwenden Sie dieses Feld, um festzustellen, welche Varianzgruppen keine Redundanz enthalten.


    Geoid-Modell-Statistik

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die Zusammenfassung der Geoid-Beobachtungsstatistik im Abschnitt Statistik für Beobachtungstypen, um den ermittelten Referenzfaktor und die Redundanzzahl (Freiheitsgrade) für Geoid-Beobachtungen abzulesen.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Statistische Zusammenfassung – Geoid-Modell.

Die Geoid-Modell-Statistik wird angezeigt.

Sie enthält folgende Felder:

Referenzfaktor

Jeder Beobachtungstyp hat seine eigenen geschätzten Fehler und daher auch seinen eigenen Referenzfaktor. Dieser Wert gibt an, in welchem Umfang die Beobachtungstypen zum Netz-Referenzfaktor beitragen. In der Trimble Geomatics Office Software können Sie mit jeder Beobachtungsmethode (GPS, terrestrisch oder Geoid) getrennt arbeiten, um jede Beobachtungsgruppe getrennt zu gewichten und dann den entsprechenden Skalierungsbetrag auf die Fehlerschätzungen in jeder Gruppe anzuwenden.

Redundanzzahl

Die Redundanzzahl, mitunter auch als Freiheitsgrade für das Netz bezeichnet, ist ein Indikator dafür, in welchem Umfang jede Beobachtung zur allgemeinen Redundanz beiträgt. Verwenden Sie diese Statistik, um festzustellen, welche Beobachtungen keine Redundanz enthalten.


    Ausgeglichene GPS-Beobachtungen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die Tabelle mti den ausgeglichenen GPS-Beobachtungen, um:

  die Anzahl der in der Ausgleichung verwendeten GPS-Beobachtungen zu überprüfen.

  die mittleren a posteriori Fehler einer jeden Beobachtungskomponente zu bewerten.

  die GPS-Beobachtungskomponenten zu identifizieren, die das für das Netz definierte kritische Tau überschreiten (Ausreißer). Unzuverlässige Beobachtungen sind rot markiert und helfen beim Identifizieren von Ausreißern.

  alle unerwarteten Transformationen und extrem große Fehlerschätzungen in Parametern zu identifizieren.

Die folgenden Felder können der Tabelle mit den ausgeglichenen GPS-Beobachtungen vorangestellt sein:

HINWEIS: Transformationsparameter-Felder werden basierend auf dem Parameterstatus im Bericht angegeben. Aus dem Parameterstatus ergeben sich die folgenden im Bericht enthaltenen Werte:

Nicht verwendet – Ein Parameter, dessen Status auf ‘Nicht verwendet‘ eingestellt ist, wird nicht in den Bericht einbezogen.

Benutzerdefiniert – Ein Parameter, dessen Status auf ‘Benutzerdefiniert‘ eingestellt ist, wird als benutzerdefinierter Wert unabhängig von der Anzahl der bedingten Koordinatenkomponenten angegeben.

Berechnet – Ein Parameter, dessen Status auf ‘Berechnet‘ eingestellt ist, wird angezeigt, nachdem Bedingungen für die erforderliche Anzahl von Koordinatenkomponenten festgelegt wurden.

Weitere Informationen über die Definition und Berechnung von Transformationsparametern finden Sie unter Transformationsparameter – Überblick.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet, und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Beobachtungen - GPS.

Die Statistik für die ausgeglichenen GPS-Beobachtungen wird angezeigt.

Die Statistik enthält:

GPS-Transformationsgruppe

Dieses Feld enthält die Bezeichnungen aller in der Ausgleichung enthaltenen Transformationsgruppen Das Feld dient ebenfalls zur Unterscheidung der im Bericht enthaltenen Informationen für die einzelnen Transformationsgruppen.

Ablenkung in Längengrad

Diese Felder enthalten die Längengrad-Ablenkung des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht angegeben, wenn mindestens 3 ellipsoidische Höhen und ein 2D-Punkt festgehalten wurden.

HINWEIS: Für eine Geoid-Transformationsgruppe müssen mindestens sechs Höhen (3 orthometrische und 3 ellipsoidische Höhen) und ein 2D-Punkt festgehalten werden.

Ablenkung in Breitengrad

Diese Felder enthalten die Breitengrad-Ablenkung des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht angegeben, wenn mindestens 3 ellipsoidische Höhen und ein 2D-Punkt festgehalten wurden.

HINWEIS: Für eine Geoid-Transformationsgruppe müssen mindestens sechs Höhen (3 orthometrische und 3 ellipsoidische Höhen) und ein 2D-Punkt festgehalten werden.

Azimut-Rotation

Diese Felder enthalten die Azimut-Rotation des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und angezeigt, wenn mindestens zwei 2D-Punkte festgehalten wurden.

Netzmaßstab

Diese Felder enthalten den Netzmaßstab des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und angezeigt, wenn mindestens eine ellipsoidische Höhe und zwei 2D-Punkte festgehalten wurden.

Streckenmaßstab

Diese Felder enthalten den Streckenmaßstab des Parameterwerts und den geschätzten Fehler. Dieser Wert wird verwendet, um systematische Fehler aus Strecken zu entfernen.

Strecken-Konstante

Diese Felder enthalten die Strecken-Konstante des Parameterwerts und den geschätzten Fehler. Dieser Wert wird verwendet, um systematische Fehler aus Strecken zu entfernen.

Höhen-Konstante

Diese Felder enthalten die Höhen-Konstante des Parameterwerts und den geschätzten Fehler. Dieser Wert verwendet, um ellipsoidische Höhenfehler aus dem System zu entfernen.

Anzahl Beobachtungen

Dieses Feld enthält die Gesamtzahl der GPS-Beobachtungen, die in der Ausgleichung enthalten sind.

Anzahl Ausreißer

Dieses Feld enthält die Gesamtzahl der Ausreißer (GPS-Beobachtungen mit hohen Restwerten), die in der Ausgleichung enthalten sind.

Beobachtungsausgleichung (Kritisches Tau = #)

Dieses Feld enthält den in der Ausgleichung verwendeten kritischen Tau-Wert. Die Tabelle Ausgeglichene GPS-Beobachtungen wird im Anschluß an dieses Feld angezeigt

Die GPS-Beobachtungstabelle enthält folgende Spalten:

Spalte	Was angezeigt wird
Beob.-ID	Der Datensatzname, der der Beobachtung im Projekt zugeordnet wurde. Bei GPS-Beobachtungen ist der ID-Nummer der Buchstabe ‘B’ vorangestellt.
Von Pkt.	Der Startpunktname der GPS-Beobachtung.
Zu Pkt.	Der Endpunktname der GPS-Beobachtung
Beobachtung	Diese Spalte enthält die ausgeglichenen Werte für die GPS-Beobachtungkomponenten.
A-posteriori Fehler (Sigma-Wert)	Der geschätzte a posteriori Fehler für die GPS-Beobachtungskomponenten. Der im Ausgleichungsstil eingestellte Sigma-Skalar wird in der Kopfzeile der Spalte angezeigt.
Restwert	Der Beobachtungsrestwert für die GPS-Beobachtungskomponenten.
Stand. Restwert	Der standardisierte Restwert für die GPS-Beobachtungskomponenten. Die standardisierten Restwerte ermöglichen Ihnen den direkten Vergleich der Fehler einer Winkelmessung mit Fehlern einer linearen Messung.


Ausgeglichene terrestrische Beobachtungen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie die Beobachtungen in der Tabelle der ausgeglichene terrestrischen Beobachtungen, um:

  die Anzahl der in der Ausgleichung verwendeten terrestrischen Beobachtungen zu überprüfen.

  die mittleren a posteriori Fehler für terrestrische Beobachtungen in der Ausgleichung zu bewerten.

  die terrestrischen Beobachtungskomponenten zu identifizieren, die das für das Netz definierte kritische Tau für Ausreißer überschreiten. Unzuverlässige Beobachtungen sind rot markiert und helfen beim Identifizieren von Ausreißern.

  alle unerwarteten Transformationen und extrem große Fehlerschätzungen in Parametern zu identifizieren.

Die folgenden Felder können einer Tabelle Ausgeglichene terrestrische Beobachtungen vorangestellt sein:

HINWEIS: Transformationsparameter-Felder werden basierend auf dem Parameterstatus im Bericht angegeben. Aus dem Parameterstatus ergeben sich die folgenden im Bericht enthaltenen Werte:

  Nicht verwendet – es werden keine Werte in den Bericht einbezogen.

  Benutzerdefiniert –wird als benutzerdefinierter Wert unabhängig von der Anzahl der bedingten Koordinatenkomponenten angegeben.

  Berechnet – wird angezeigt, nachdem Bedingungen für Koordinatenkomponenten festgelegt wurden.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgeglichene Beobachtungen - Terrestrisch.

Die Statistik der ausgeglichenen terrestrischen Beobachtungen wird angezeigt.

Die Statistik enthält:

Terrestrische Transformationsgruppe

Dieses Feld enthält den Namen jeder in der Ausgleichung enthaltenen Transformationsgruppe. Dieses Feld dient auch als Überschrift zur Unterschiedung der einzelnen im Bericht enthaltenen Transformationsgruppen.

Ablenkung in Längengrad

Diese Felder enthalten die Längengrad-Ablenkung des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht wiedergegeben, wenn mindestens 3 ellipsoidische Höhen und ein 2D-Punkt festgehalten wurden.

HINWEIS: Dies unterscheidet sich von einer Geoid-Transformationsgruppe, für die mindestens 6 Höhen (3 ellipsoidischen und 3 orthometrische Höhen) und ein 2D-Punkt festgehalten werden müssen.

Ablenkung in Breitengrad

Diese Felder enthalten die Breitengrad-Ablenkung des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht wiedergegeben, wenn mindestens 3 ellipsoidische Höhen und ein 2D-Punkt festgehalten wurden.

HINWEIS: Dies unterscheidet sich von einer Geoid-Transformationsgruppe, für die mindestens 6 Höhen (3 ellipsoidischen und 3 orthometrische Höhen) und ein 2D-Punkt festgehalten werden müssen.

Azimut-Rotation

Diese Felder enthalten die Azimut-Rotation des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und angezeigt, wenn mindestens zwei 2D-Punkte festgehalten wurden.

Netzmaßstab

Diese Felder enthalten den Netzmaßstab des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und angezeigt, wenn mindestens eine ellipsoidische Höhe zwei 2D-Punkte festgehalten wurden.

Streckenmaßstab

Diese Felder enthalten den Streckenmaßstab des Parameterwerts und den geschätzten Fehler. Dieser Wert wird verwendet, um systematische Fehler aus Strecken zu entfernen.

Strecken-Konstante

Diese Felder enthalten die Strecken-Konstante des Parameterwerts und den geschätzten Fehler. Dieser Wert wird verwendet, um systematische Fehler aus Strecken zu entfernen.

Höhen-Konstante

Diese Felder enthalten die Höhen-Konstante des Parameterwerts und den geschätzten Fehler. Dieser Wert verwendet, um ellipsoidische Höhenfehler aus dem System zu entfernen.

Anzahl Beobachtungen

Dieses Feld enthält die Gesamtzahl der terrestrischen Beobachtungen, die in der Ausgleichung enthalten sind.

Anzahl Ausreißer

Dieses Feld enthält die Gesamtzahl der Ausreißer (terrestrische Beobachtungen mit hohen Restwerten), die in der Ausgleichung enthalten sind.

Beobachtungsausgleichung (Kritisches Tau = #)

Dieses Feld enthält den in der Ausgleichung verwendeten kritischen Tau-Wert. Die Tabelle Ausgeglichene GPS-Beobachtungen wird im Anschluß an dieses Feld angezeigt

Die Tabelle Terrestrische Beobachtungen enthält folgende Spalten:

Spalte	Was angezeigt wird
Beob.-ID	Der Datensatzname, der der Beobachtung im Projekt zugeordnet wurde. Bei terrestrischen Beobachtungen ist der ID-Nummer der Buchstabe ‘T’ vorangestellt.
RB (Rückblick)	Der Name des Rückblick-Punkts.
Instr (Instrumentenpunkt)	Der Name des besetzten Punkts.
VB (Vorblick)	Der Name des Vorblick-Punkts.
Beobachtung	Die ausgeglichenen Werte der terrestrischen Beobachtungskomponenten.
A-posteriori Fehler (Sigma-Wert)	Der geschätzte a posteriori Fehler für die terrestrischen Beobachtungskomponenten. Der im Ausgleichungsstil eingestellte Sigma-Skalar wird in der Kopfzeile der Spalte angezeigt.
Restwert	Der Beobachtungsrestwert für die terrestrischen Beobachtungskomponenten.
Stand. Restwert	Der standardisierte Restwert für die terrestrischen Beobachtungskomponenten. Die standardisierten Restwerte ermöglichen Ihnen den direkten Vergleich der Fehler einer Winkelmessung mit Fehlern einer linearen Messung.


Ausgeglichen Geoid-Beobachtungen
 Ausgeglichene Geoid-Beobachtungen

Weitere Informationen

 Siehe auch

Überblick

Verwenden Sie diese Statistik, um die Informationen über die ausgeglichenen Geoid-Beobachtungen zu prüfen:

  den in der Ausgleichung verwendeten kritischen Tau-Wert

  Geoid-Beobachtungen mit ihrem assoziierten (geschätzten) mittleren a posteriori Fehler, dem Restwert und den standardisierten Restwerten.

  Geoid-Beobachtungen, die als Ausreißer gekennzeichnet (rot markiert) wurden.

  Transformationsparameter mit ihren assoziierten Fehlerschätzungen (vollständig bedingte Ausgleichung)

  Eine Zusammenfassung der in der Ausgleichung verwendeten Geoid-Beobachtungen sowie eine Tabelle, die Informationen über alle Geoid-Beobachtungen enthält.

Verwenden Sie die Beobachtungen in der Tabelle mit den ausgeglichenen Geoid-Beobachtungen, um:

  die Anzahl der in der Ausgleichung verwendeten Geoid-Beobachtungen zu überprüfen.

  die mittleren a posteriori Fehler für jede Beobachtung zu bewerten.

  die Geoid-Beobachtungen zu identifizieren, die das für das Netz definierte kritische Tau überschreiten (Ausreißer). Unzuverlässige Beobachtungen sind rot markiert und helfen beim Identifizieren von Ausreißern.

  alle unerwarteten Transformationen und extrem große Fehlerschätzungen in Parametern zu identifizieren.

Die folgenden Felder können einer Tabelle mit ausgeglichenen Geoid-Beobachtungen vorangestellt sein:

HINWEIS: Transformationsparameter-Felder werden basieren auf dem Parameterstatus im Bericht angegeben. Aus dem Parameterstatus ergeben sich die folgenden im Bericht enthaltenen Werte:

Nicht verwendet – Ein Parameter, dessen Status auf ‘Nicht verwendet‘ eingestellt wurde, wird nicht in den Bericht einbezogen.

Benutzerdefiniert – Ein Parameter, dessen Status auf ‘Benutzerdefiniert‘ eingestellt ist, wird als benutzerdefinierter Wert unabhängig von der Anzahl der bedingten Koordinatenkomponenten angegeben.

Berechnet – Ein Parameter, dessen Status auf ‘Berechnet‘ eingestellt ist, wird angezeigt, nachdem Bedingungen für die erforderliche Anzahl von Koordinatenkomponenten festgelegt wurden.

So greifen Sie auf diese Statistik zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms Ausgeglichene Beobachtungen - Geoid.

Die Statistik für die ausgeglichenen Geoid-Beobachtungen wird angezeigt.

Die Statistik enthält:

Geoid-Transformationsgruppe

Dieses Feld enthält den Namen der in der Ausgleichung enthaltenen Geoid-Transformationsgruppe. Da es nur eine voreingestellte Geoid-Transformationsgruppe gibt, wird in diesem Berichtsabschnitt immer die Transformationsgruppe <Geoid-Voreinstellung> aufgelistet.

Ablenkung in Längengrad

Diese Felder enthalten die Längengrad-Ablenkung des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht wiedergegeben, wenn mindestens 6 Höhen (3 orthometrische und 3 ellipsoidische Höhen) und ein 2D-Punkt festgehalten wurden. Dies unterscheidet sich von der GPS-Transformationsgruppe, für die mindestens 3 Höhen und ein 2D-Punkt festgehalten werden müssen.

Ablenkung in Breitengrad

Diese Felder enthalten die Breitengrad-Ablenkung des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht wiedergegeben, wenn mindestens 6 Höhen (3 orthometrische und 3 ellipsoidische Höhen) und ein 2D-Punkt festgehalten wurden. Dies unterscheidet sich von der GPS-Transformationsgruppe, für die mindestens 3 Höhen und ein 2D-Punkt festgehalten werden müssen.

Höhen-Konstante

Diese Felder enthalten die Höhen-Konstante des Parameterwerts und den geschätzten Fehler. Dieser Wert wird berechnet und im Bericht wiedergegeben, wenn mindestens eine ellipsoidische und eine orthometrische Höhe festgehalten wurden.

HINWEIS: Die Parameter Azimut-Rotation, Netzmaßstab, Streckenmaßstab und Strecken-Konstante werden nicht für die Transformation von (ellips.) Geoid-Höhen verwendet.

Anzahl Beobachtungen

Dieses Feld enthält die Gesamtzahl der Geoid-Beobachtungen, die in der Ausgleichung enthalten sind.

Anzahl Ausreißer

Dieses Feld enthält die Gesamtzahl der in der Ausgleichung enthaltenen Ausreißer (GPS-Beobachtungen mit hohen Restwerten).

Beobachtungsausgleichung (Kritisches Tau = #)

Dieses Feld enthält den in der Ausgleichung verwendeten kritischen Tau-Wert.  Die Tabelle mit den ausgeglichenen Geoid-Beobachtungen wird direkt im Anschluß an dieses Feld angezeigt.

Die Tabelle mit den ausgeglichenen Geoid-Beobachtungen enthält folgende Spalten:

Spalte	Was angezeigt wird
Beobachtungs-ID	Der Datensatzname, der der Geoid-Beobachtung in dem Projekt zugeordnet wurde. Bei Geoid-Beobachtungen ist der ID-Nummer der Buchstabe ‘G’ vorangestellt.
Punktname	Der Name des Punktes, der verwendet wurde, um Geoid-Beobachtungen aus dem Geoid-Modell zu extrahieren.
Abstand	Der ausgeglichene Wert.
A-posteriori Fehler (Sigma-Wert)	Der geschätzte a posteriori Fehler für jede Geoid-Beobachtung. Die im Ausgleichungsstil eingestellten Sigma-Skalare werden in der Kopfzeile der Spalte angezeigt.
Restwert	Der Beobachtungsrestwert.
Standardisierter Restwert	Der standardisierte Restwert für jede Geoid-Beobachtung. Der standardisierte Restwert ermöglicht Ihnen einen direkten Vergleich der Fehler von Winkelmessungen mit den Fehlern linearer Messungen.
HINWEIS: Wenn Korrelationen für das Geoid berechnet werden, haben alle augeglichenen Abstände Restwerte. Wurden keine Korrelationen berechnet, dann haben nur Punkte mit bedingten vertikalen Koordinaten Geoid-Restwerte.


Ausgleichungsstil-Einstellungen

Überblick

Sehen Sie sich in diesem Berichtabschnitt die Zusammenfassung der Einstellungen für die Netzausgleichung an.

So greifen Sie auf die Ausgleichungsstil-Einstellungen zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Ausgleichungsstil-Einstellungen.

Folgende Ausgleichungssti-Einstellungen werden angezeigt:

Restwert-Toleranzen

Dieser Abschnitt enthält folgende Einstellungen:

  Iterationen beenden bei

  Endgültiger Konvergenz-Grenzwert

Kovarianz-Anzeige

Folgende Informationen für horizontale Fehlerparameter werden angezeigt:

  Fortgepflanzter linearer Fehler [E]

  Absolutglied [C]

  Skalar bei linearem Fehler [S]

Folgende Informationen werden für dreidimensionale Parameter angezeigt

  Fortgepflanzter linearer Fehler [E]

  Absolutglied [C]

  Skalar bei linearem Fehler [S]

In diesem Abschnitt wird darüber hinaus angegeben, ob die Option Höhenfehler verwenden, falls verfügbar gewählt wurde.

Ausgleichungssteuerungen

Folgende Informationen werden angezeigt:

  Korrelationen für Geoid berechnen

  Ob eine horizontale oder vertikale Ausgleichung (oder beide) durchgeführt wurden.

HINWEIS: Dieser Abschnitt ist nur im Bericht enthalten, wenn terrestrische Beobachtungen in der Ausgleichung enthalten sind.

Standpunktfehler

Folgende GPS-Standpunktfehler werden angezeigt:

  Fehler in Antennenhöhe

  Zentrierfehler

Folgende terrestrische Standpunktfehler werden angezeigt:

  Fehler in Antennenhöhe

  Zentrierfehler

HINWEIS: Die terrestrischen Standpunktfehler werden sind nur im Bericht enthalten, wenn terrestrische Beobachtungen in der Ausgleichung enthalten waren.

Weitere Informationen über Standpunktfehler finden Sie unter Standpunktfehler.


Dialogfeld Einstellungen Netzausgleichungsbericht

Überblick

Verwenden Sie dieses Dialogfeld, um festzulegen, welche Informationen im Netzausgleichungsbericht enthalten sein sollen.

So greifen Sie darauf zu:

  Wählen Sie Berichte / Einstellungen / Bericht Netzausgleichung. Das Dialogfeld Einstellungen Netzausgleichungsbericht erscheint.

Folgende Abschnitte können im Netzausgleichungsbericht angezeigt werden:

  Individuelle GPS-Beobachtungsstatistik

  Ausgeglichene Gitternetz-Koordinaten

  Ausgeglichene geodätische Koordinaten

  Koordinaten-Deltas

  Festpunktkoordinatenvergleiche

  Punktfehlerellipsen

  Kovarianzwerte

HINWEIS: Bei großen Projekten ist die Anzeige und Erstellung von Punktfehlerellipsen und Kovarianzwerten recht zeitaufwendig. Deaktivieren Sie diese Optionen im Dialogfeld Einstellungen Netzausgleichungsbericht, um Berichte schneller zu erstellen.


Festpunktkoordinatenvergleiche

Überblick

Wenn Sie eine Ausgleichung für einen Punkt durchführen, dessen Koordinaten Festpunktqualität haben und für den keine Bedingungen festgehalten wurden, wird im Netzausgleichungsbericht die Differenz zwischen den nicht bedingten Festpunktkoordinaten und den ausgeglichenen Festpunktkoordinaten angezeigt.

So greifen Sie auf Festpunktkoordinatenvergleiche zu:

1.	Wählen Sie Berichte / Bericht Netzausgleichung. Das voreingestellte HTML-Anzeigemodul wird gestartet und der Netzausgleichungsbericht mit der Ausgleichungskopfzeile am Berichtanfang erscheint.

2.	Klicken Sie im Inhaltsabschnitt auf der linken Seite des Bildschirms auf Festpunktkoordinatenvergleiche.

Die Festpunktkoordinatenvergleiche werden in einer Tabelle angezeigt. Sie enthält folgende Felder:

Punktname

Den Namen des Punkts mit Festpunktqualität.

Delta-Werte

Die Unterschiede zwischen den nicht bedingten Festpunktkoordinaten und den ausgeglichenen Festpunktkoordinaten werden angezeigt für:

  ΔHochwert

  ΔRechtswert

  ΔHöhe

  ΔEllips. Höhe

HINWEIS: Die Unterschiede werden wie folgt berechnet:

Unterschied zwischen Festpunktkoordinaten = Festpunktkoordinate − ausgeglichene Koordinate


    Befehl Ausgleichen

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um eine Netzausgleichung durchzuführen.

Vergewissern Sie sich, daß alle Ausgleichungsstil-Einstellungen korrekt, die Festpunktkoordinaten festgelegt und Beobachtungen verfügbar sind.

Führen Sie einen der nachfolgenden Schritte aus, um eine Ausgleichung durchzuführen:

  Wählen Sie Ausgleichung / Ausgleichen.

  Drücken Sie F10.

Die Ausgleichung beginnt.

Nach jeder Ausgleichungsiteration wird ein Beobachtungsrestwert mit Hilfe von zwei unterschiedlichen Software-Routinen berechnet. Die Differenz der beiden Berechnungen wird mit der im Feld ‘Iterationen beenden bei’ festgelegten Toleranz verglichen. Ausgehend von diesem Vergleich, wird einer der folgenden Vorgänge durchgeführt:

  Wenn die Differenz zwischen den berechneten Beobachtungsrestwerten geringer ist, als die im Feld ‘Iterationen beenden bei’ festgelegte Toleranz, werden die Ausgleichungsiterationen beendet. Der Netzausgleichungsbericht enthält die Meldung ‘Erfolgreiche Ausgleichung in ## Iteration(en)’, wobei ## die Anzahl der Iterationen bezeichnet, die für die Konvergenz des Netzes erforderlich waren.

  Wenn die Differenz zwischen den berechneten Beobachtungsrestwerten größer ist, als die im Feld ‘Iterationen beenden bei’ festgelegte Toleranz, werden die Ausgleichungsiterationen fortgeführt. Ist der im Feld ‘Maximale Iterationen’ festgelegte Wert erreicht, kommt der Endgültige Konvergenz-Grenzwert zur Anwendung (siehe unten).

Endgültiger Konvergenz-Grenzwert

Geben Sie den Konvergenz-Grenzwert für die letzte Netzausgleichungsiteration in dieses Feld ein. Wenn die letzte durchgeführte Iteration die festgelegte Toleranz im Feld ‘Iterationen beenden bei’ nicht überschreitet, benutzt die Software diesen Wert, um zu bestimmen, ob die Netzausgleichung erfolgreich durchgeführt wurde.

Wenn die berechnete Differenz im Beobachtungsrestwert für die letzte Ausgleichungsiteration größer ist, als die festgelegte Toleranz im Feld ‘Iterationen beenden bei’, wird der Restwert mit dem endgültigen Konvergenz-Grenzwert verglichen und einer der nachfolgenden Vorgänge durchgeführt:

  Wenn die Differenz zwischen den berechneten Beobachtungsrestwerten geringer ist als der endgültige Konvergenz-Grenzwert, ist die Ausgleichung erfolgreich und die Meldung ‘Erfolgreiche Ausgleichung in ## Iteration(en) (endgültiger Konvergenz-Grenzwert verwendet)’ wird angezeigt, wobei ## die Anzahl der Iterationen bezeichnet, die für die Konvergenz des Netzes erforderlich waren.

 Wenn der Beobachtungsrestwert größer ist, als der endgültige Konvergenz-Grenzwert, ist die Ausgleichung gescheitert, und ein Dialogfeld mit der Warnmeldung ‘Ausgleichung gescheitert. Keine Konvergenz’ erscheint.

Weitere Informationen zum Netzausgleichungsprozeß finden Sie unter Netzausgleichung.

Weitere Informationen über Iterationen und die während dieses Vorgangs durchgeführten Berechnungen finden Sie unter Restwert-Toleranzen.


    Befehl Ausgleichungsstile

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um Ausgleichungsstile auszuwählen, anzusehen, zu erstellen, zu kopieren, zu bearbeiten, umzubenennen und zu löschen.

So greifen Sie auf das Dialogfeld Netzausgleichungsstile zu:

  Wählen Sie Ausgleichung / Ausgleichungsstile.


 Befehl Datum

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um das Datum für die Ausgleichung auszuwählen.

So greifen Sie auf das Untermenü Datum zu:

  Wählen Sie Ausgleichung / Datum.

Das Untermenü Datum erscheint. Es enthält folgende Befehle:

  WGS-84

  Projektdatum


    Befehl Beobachtungsgruppen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die Varianz- und Transformationsgruppen für die Netzausgleichung festzulegen.

So greifen Sie auf das Untermenü Beobachtungsgruppen zu:

  Wählen Sie Ausgleichung / Beobachtungsgruppen.

Das Untermenü Gruppen erscheint. Es enthält folgende Befehle:

  Varianzgruppen

  Transformationsgruppen


    Befehl Bericht Netzausgleichung

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Überblick

Wählen Sie diesen Befehl, um den Netzausgleichungsbericht anzusehen.

So greifen Sie auf den Netzausgleichungsbericht zu:

  Wählen Sie Berichte / Bericht Netzausgleichung.

Der Bericht wird im HTML-Format erstellt, und das für Ihren Computer voreingestellte HTML-Anzeigemodul wird automatisch gestartet, um die Berichtsdaten anzuzeigen.

Weitere Informationen über den Bericht finden Sie unter Netzausgleichungsbericht.


    Befehl Beobachtungen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um Beobachtungen anzusehen und zu bewerten. Mit diesem Befehl können Sie darüber hinaus Beobachtungen in eine Netzausgleichung ein- oder ausschließen.

So greifen Sie auf das Dialogfeld Beobachtungen zu:

  Wählen Sie Ausgleichung / Beobachtungen.


    Befehl Punkte

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um das Dialogfeld Punkte zu öffnen. Es enthält Optionen zur Ansicht, Einstellung und Aufhebung des Festpunktstatus für Koordinatenkomponenten von Festpunkten, die in einer Netzausgleichung verwendet werden:

So greifen Sie auf das Dialogfeld Punkte zu:

  Wählen Sie Ausgleichung / Punkte.


    Befehl Projektdatum

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um das Projektdatum als Datum für die Netzausgleichung festzulegen. Das Projektdatum wird im Register Koordinatensystem des Dialogfelds Projekteigenschaften festgelegt. Das Projektdatum wird bei der Durchführung einer vollständig bedingten Netzausgleichung und bei einer minimal bedingten Netzausgleichung für terrestrische Daten verwendet.

So wählen Sie das Projektdatum:

  Wählen Sie Ausgleichung / Datum / Projektdatum − <Datum>.

Ein Häkchen erscheint neben der Option Projektdatum − <Datum>.


    Befehl Ausgleichung entfernen

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die aktuelle Ausgleichung zu entfernen.

So entfernen Sie die ausgeglichenen Werte:

  Wählen Sie Ausgleichung / Ausgleichung entfernen.

Verwenden Sie diese Option, um zur Netzkonfiguration vor der Ausgleichung zurückzukehren. Wenn Sie diesen Befehl verwenden, wird/werden:

  das Datum auf WGS-84 festgelegt

  die Bedingungen für festgehaltene Punkte aufgehoben

  Fehlerellipsen entfernt

  Geoid-Beobachtungen entladen

  Skalare auf die Option Alle Beobachtungen und die voreingestellten Optionen zurückgesetzt

HINWEIS: Beobachtungen, die für die Ausgleichung deaktiviert wurden, und Beobachtungen, für die das Kontrollkästchen Bei der Netzausgleichung verwenden im Eigenschaftsfenster deaktiviert wurde, werden nicht in den ursprünglichen Zustand zurückversetzt.


    Befehl Transformationsgruppen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die Transformationsgruppen für Beobachtungen in der Ausgleichung festzulegen.

So greifen Sie auf das Dialogfeld Transformationsgruppen zu:

  Wählen Sie Ausgleichung / Beobachtungsgruppen / Transformationsgruppen.


    Befehl Varianzgruppen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Wählen Sie diesen Befehl, um die Varianzgruppen für die Beobachtungen in der Netzausgleichung festzulegen.

So greifen Sie auf das Dialogfeld Varianzgruppen zu:

  Wählen Sie Ausgleichung / Beobachtungsgruppen / Varianzgruppen.


    Befehl WGS-84

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um WGS-84 als Datum für die Netzausgleichung auszuwählen. Das WGS-84 Datum sollte bei der Durchführung einer minimal bedingten Ausgleichung für GPS-Beobachtungen verwendet werden.

So wählen Sie das WGS-84-Datum:

  Wählen Sie Ausgleichung / Datum / WGS-84.

Ein Häkchen erscheint neben der Option WGS-84.


    Befehl Gewichtungsstrategien

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um das Dialogfeld Gewichtungsstrategien anzuzeigen. Es enthält Optionen für die Definition und die Anwendung von Skalargewichtungsstrategien, die in der Ausgleichung verwendet werden.

So greifen Sie auf das Dialogfeld Gewichtungsstrategien zu:

  Wählen Sie Ausgleichung / Gewichtungsstrategien.


    Befehl Speichern (Kalibrierungskoordinaten)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die Kalibrierungskoordinaten nach der Durchführung einer minimal bedingten GPS-Ausgleichung zu speichern. Die Kalibrierungskoordinaten bestehen den aus WGS-84 Breiten, Längen und Ellipsoid-Höhen, die bei der minimal bedingten Ausgleichung erzeugt wurden.

Diese Koordinaten werden als GPS-Koordinaten verwendet, wenn eine örtliche Anpassung mit der Trimble Geomatics Office Software durchgeführt wird.

So greifen Sie auf das Dialogfeld Kalibrierungskoordinaten speichern zu:

  Wählen Sie Ausgleichung / Kalibrierungskoordinaten / Speichern.

HINWEIS: Dieser Befehl steht nicht zur Verfügung, wenn das Projektdatum bei der Netzausgleichung verwendet wird oder wenn terrestrische Daten in der Netzausgleichung enthalten sind.

HINWEIS: Wenn Kalibrierungskoordinaten gespeichert werden, wird eine WGS-84 Kalibrierungskoordinate für den Punkt gespeichert.


    Befehl Entfernen (Kalibrierungskoordinaten)

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Kalibrierungskoordinaten sind WGS-84 Breiten, Längen und ellipsoidische Höhen, die bei einer minimal bedingten GPS-Ausgleichung im WGS-84 Datum erzeugt werden. Wählen Sie diesen Befehl, um sie aus dem Projekt zu entfernen.

  Wählen Sie Ausgleichung / Kalibrierungskoordinaten / Entfernen.


    Befehl Beobachtung deaktivieren

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, wenn Sie eine Beobachtung aus der Liste der Ausgleichungsbeobachtungen vollständig deaktivieren möchten. Wenn eine Beobachtung vollständig deaktiviert wird, wird sie aus der Liste der Beobachtungen entfernt und nicht länger für Ausgleichungen oder Neuberechnungen verwendet.

HINWEIS: Das Deaktivieren einer Beobachtung ist nicht mit dem Ausschließen einer Beobachtung zu verwechseln. Ausgeschlossene Beobachtungen erscheinen weiterhin in der Beobachtungsliste, werden aber nicht bei Ausgleichungen oder Neuberechnungen mitverarbeitet.

So deaktivieren Sie eine Beobachtung:

1.	Wählen Sie Ausgleichung / Beobachtungen. Das Dialogfeld Beobachtungen erscheint.

2.	Klicken Sie mit der rechten Maustaste auf die entsprechende Beobachtung, und wählen Sie Beobachtung deaktivieren aus dem Verknüpfungsmenü.

Die Beobachtung wird aus der Beobachtungsliste entfernt und nicht länger für Ausgleichungen oder Neuberechnungen verwendet.

Deaktivierte Beobachtungen können im Dialogfeld Beobachtungen nicht wieder aktiviert werden. Sie müssen stattdessen im Graphikfenster gewählt und die deaktivierten Eigenschaften müssen erneut aktiviert werden. Eine Beobachtung wird erneut aktiviert, indem ihr Status von ‘Deaktiviert‘ auf ‘Aktiviert‘ geändert wird.


    Befehl Kalibrierungskoordinaten

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Wählen Sie diesen Befehl, um ein Untermenü mit Befehlen zur Speicherung und Entfernung von Kalibrierungskoordinaten anzuzeigen

So greifen Sie auf das Untermenü zu:

  Wählen Sie Ausgleichung / Kalibrierungskoordinaten.

Ein Menü mit folgenden Befehlen erscheint:

  Speichern

  Entfernen


    Dialogfeld Kalibrierungskoordinaten speichern

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Verwenden Sie das Dialogfeld Kalibrierungskoordinaten speichern, um festzulegen, wie Kalibrierungskoordinaten gespeichert werden sollen.

HINWEIS: Diese Option steht nur zur Verfügung, wenn das Ausgleichungsdatum auf WGS-84 eingestellt ist und ausschließlich GPS-Beobachtungen ausgeglichen wurden.

So greifen Sie auf dieses Dialogfeld zu:

  Wählen Sie Ausgleichung / Kalibrierungskoordinaten / Speichern.

Die Gruppe Koordinaten für Kalibrierung speichern enthält folgende Optionen:

Bestehende Punkte

Wenn Sie die Koordinaten als bestehende Punkte speichern möchten, werden sie als zusätzliche Koordinate mit der Bezeichnung Kalibrierungssatz gespeichert.

Neue Punkte mit Suffix

Wenn Sie die Koordinaten als Neue Punkte mit dem Suffix: GPS speichern, wird ein neuer Punkt-Datensatz mit der Bezeichnung "<Punktname>-GPS" gespeichert. Sie können das ‘GPS’-Suffix ändern, bevor Sie die Kalibrierungskoordinaten speichern.

Weitere Informationen finden Sie unter Kalibrierungskoordinaten speichern.


    Die Ellipsenparameter-Symbolleiste

Weitere Informationen

Wie kann ich ...	Siehe auch

Überblick

Die Ellipsenparameter-Symbolleiste ermöglicht Ihnen das Filtern von Fehlerellipsen und Pfeilen für ellipsoidische und orthometrische Höhenfehler, die im Graphikfenster nach einer Ausgleichung angezeigt werden. Darüber hinaus sind Steuerungen für die Skalierung der Fehlerellipsengröße und für die Anpassung der Markierungsgröße verfügbar.

So zeigen Sie die Ellipsenparameter-Symbolleiste an:

  Wählen Sie in der Vermessungsansicht Ansicht / Symbolleisten / Ellipsenparameter.

  Klicken Sie im Symbolleisten-Bereich der Vermessungsansicht mit der rechten Maustaste, und wählen Sie Ellipsenparameter.

Die Ellipsenparameter-Symbolleiste erscheint. Sie können diesen Befehl erneut wählen, um die Symbolleiste auszublenden.

HINWEIS: Sie können auch das Register Fehlerellipsen-Steuerungen im Dialogfeld Ansichtsoptionen verwenden, um die Anzeige der Fehlerellipsen zu steuern.

Die Symbolleiste verfügt über folgende Schaltflächen:

	Diese Schaltfläche aktiviert/deaktiviert den Befehl Ellipsenparameter-Symbolleiste. Dieser Befehl entspricht dem Aktivieren und Deaktivieren des Kontrollkästchens Punktfehlerellipsen & Pfeile anzeigen im Dialogfeld Ansichtsoptionen. Die Befehle (Schaltflächen) ‘Ellips. Höhenfehler‘ und ‘Höhenfehler‘ stehen zur Verfügung, wenn diese Schaltfläche aktiviert wurde.
	Diese Schaltfläche aktiviert/deaktiviert den Befehl Ellips. Höhenfehler. Sie steht nur zur Verfügung, wenn der Befehl ‘Fehlerellipsen‘ aktiviert wurde.
	Diese Schaltfläche aktiviert/deaktiviert den Befehl Höhenfehler. Sie steht nur zur Verfügung, wenn der Befehl Fehlerellipsen aktiviert  wurde.

Darüber hinaus sind folgende Steuerungen verfügbar:

Maßstab Fehlerellipsen

Die Maßstabsleiste für die Fehlerellipsen (nachstehend abgebildet), steuert die Größe der Fehlerellipsen, die nach einer Ausgleichung im Graphikfenster angezeigt werden.

Wenn Sie den Schieber nach rechts bewegen, werden die Ellipsen kleiner. Eine Verschiebung nach rechts hat den umgekehrten Effekt.

Markierungsgröße

Mit diesem Parameter (nachstehend abgebildet) kann die Markierungsgröße für die Fehlerellipsen angepaßt werden.

Die Aufwärts-/Abwärtspfeile steuern den Abstand zwischen den im Graphikfenster angezeigten Markierungen. Die Maßstabsleiste wird größer, wenn der Maßstab vergrößert wird. Der Markierungsabstand wird entsprechend angepaßt, abhängig von dem Wert, der für die Markierungssteuerung eingegeben wurde. Dies gilt umgekehrt auch, wenn die Einstellung für die Markierungsgröße verringert wird.


    Befehl Ellipsenparameter

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die Ellipsenparameter-Symbolleiste ein- oder auszublenden.

So blenden Sie die Ellipsenparameter-Symbolleiste ein- oder aus:

  Wählen Sie Ansicht / Symbolleisten / Ellipsenparameter.

Die Ellipsenparameter-Symbolleiste wird ein- bzw. ausgeblendet, wenn der Befehl gewählt wird.

HINWEIS: Sie können die Fehlerellipsen-Steuerungen auch im Register Fehlerellipsen-Steuerungen im Dialogfeld Ansichtsoptionen konfigurieren.


    Befehl Fehlerellipsen

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Der Befehl Fehlerellipsen ist auf der Ellipsenparameter-Symbolleiste verfügbar. Dieser Befehl filtert die Fehlerellipsen und Pfeile, die nach einer Ausgleichung im Graphikfenster angezeigt werden. Die Schaltflächen Ellips. Höhenfehler und Höhenfehler stehen auf der Symbolleiste zur Verfügung, wenn dieser Befehl ausgewählt wird.

HINWEIS: Der Befehl Fehlerellipsen entspricht dem Aktivieren des Kontrollkästchens Punktfehlerellipsen & Pfeile im Dialogfeld Ansichtsoptionen. Wenn der Status des Kontrollkästchens geändert wird, ändert sich auch die aktuelle Einstellung der Fehlerellipsen-Schaltfläche. Weitere Informationen finden Sie unter Fehlerellipsen und Pfeile filtern.

So wählen Sie den Befehl Fehlerellipsen:

1.	Aktivieren Sie die Ellipsenparameter-Symbolleiste.

Weitere Informationen finden Sie unter Die Ellipsenparameter-Symbolleiste ein- oder ausblenden.

2.	Klicken Sie auf die Schaltfläche [image], um die Fehlerellipsen und Pfeile zu filtern.

Die Fehlerellipsen werden ein- bzw. ausgeblendet, je nachdem, ob sie aktiviert oder deaktiviert waren, als auf die Schaltfläche geklickt wurde. Wenn die Schaltflächen Ellips. Höhenfehler und Höhenfehler gewählt sind, werden die Pfeile für die ellipsoidischen und orthometrischen Höhenfehler ebenfalls angezeigt.


    Befehl Ellips. Höhenfehler

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die Pfeile für die ellipsoidischen Höhenfehler zu filtern, die nach einer Ausgleichung im Graphikfenster angezeigt werden.

HINWEIS: Sie müssen den Befehl Fehlerellipsen auf der Ellipsenparameter-Symbolleiste oder das Kontrollkästchen Punktfehlerellilpsen & Pfeile anzeigen im Dialogfeld Ansichtsoptionen wählen, bevor dieser Befehl zur Verfügung steht.

So wählen Sie den Befehl Ellips. Höhenfehler:

1.	Aktivieren Sie die Ellipsenparameter-Symbolleiste.

2.	Klicken Sie auf die Schaltfläche [image], um die Fehlerellipsen und Pfeile zu filtern. Die Fehlerellipsen werden ein- bzw. ausgeblendet, je nachdem, ob sie aktiviert oder deaktiviert waren, als auf die Schaltfläche geklickt wurde.

3.	Klicken Sie auf die Schaltfläche [image] auf der Ellipsenparameter-Symbolleiste.

Die Pfeile für die ellipsoidischen Höhenfehler werden ein- oder ausgeblendet, wenn Sie auf die Schaltfläche klicken.


    Befehl Höhenfehler

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Wählen Sie diesen Befehl, um die Pfeile für die orthometrischen Höhenfehler zu filtern, die nach einer Ausgleichung im Graphikfenster angezeigt werden.

HINWEIS: Der Befehl Fehlerellipsen auf der Ellipsenparameter-Symbolleiste oder das Kontrollkästchen Punktfehlerellipsen & Pfeile anzeigen im Dialogfeld Ansichtsoptionen muß gewählt werden, bevor dieser Befehl zur Verfügung steht.

So wählen Sie den Befehl Höhenfehler:

1.	Aktivieren Sie die Ellipsenparameter-Symbolleiste.

Weitere Informationen finden Sie unter Die Ellipsenparameter-Symbolleiste ein- oder ausblenden.

2.	Klicken Sie auf die Schaltfläche [image], um die Fehlerellipsen und Pfeile zu filtern. Die Fehlerellipsen werden ein- bzw. ausgeblendet, je nachdem, ob sie aktiviert oder deaktiviert waren, als auf die Schaltfläche geklickt wurde. Die Schaltfläche Höhenfehler steht zur Verfügung, wenn die Schaltfläche Fehlerellipsen gewählt wurde.

3.	Klicken Sie in der Ellipsenparameter-Symbolleiste auf folgende Schaltfläche [image].

Die orthometrischen Höhenfehler werden ein- oder ausgeblendet, wenn Sie auf die Schaltfläche klicken.


Die Ellipsenparameter-Symbolleiste ein- oder ausblenden
Die Ellipsenparameter Symbolleiste ein- oder ausblenden

 Überblick und weitere Informationen

Überblick

Die Ellipsenparameter-Symbolleiste kann verwendet werden, um die Größe und die Anzeige der Fehlerellipsen und Pfeile im Graphikfenster zu ändern.

Führen Sie einen der folgenden Schritte aus, um die Ellipsenparameter-Symbolleiste anzuzeigen:

  Wählen Sie in der Vermessungsansicht Ansicht / Symbolleisten / Ellipsenparameter.

  Klicken Sie im Symbolleisten-Bereich der Vermessungsansicht mit der rechten Maustaste, und wählen Sie Ellipsenparameter.

Die Ellipsenparameter-Symbolleiste erscheint.


Die Größe der angezeigten Fehlerellipsen ändern

Überblick

Die Größe der im Graphikfenster angezeigten Fehlerellipsen kann verändert werden. Sie können vergrößert oder verkleinert werden.

So ändern Sie die Größe der angezeigten Fehlerellipsen:

1.	Aktivieren Sie die Ellipsenparameter-Symbolleiste.

Weitere Informationen finden Sie unter Die Ellipsenparameter-Symbolleiste ein- oder ausblenden.

2.	Führen Sie auf der Maßstabskontrolle für Fehlerellipsen einen der folgenden Schritte aus:

  Verschieben Sie den Maßstabsregler für die Fehlerellipsen nach links, um die Ellipsen zu verkleinern.

  Verschieben Sie den Maßstabsregler für die Fehlerellipsen nach rechts, um die Ellipsen zu vergrößern.

Die Größe der Fehlerellipsen wird entsprechend geändert.


Die Größe der Maßstabsmarkierungen für Fehlerellipsen ändern

Überblick

Der Abstand der Fehlerellipsen-Markierungen kann mit Hilfe der Ellipsenparameter Symbolleiste angepaßt werden.

So ändern Sie den Abstand der Fehlerellipsen-Markierungen:

1.	Aktivieren Sie die Ellipsenparameter-Symbolleiste.

Weitere Informationen finden Sie unter Die Ellipsenparameter-Symbolleiste ein- oder ausblenden.

2.	Führen Sie in der Steuerung Markierungsgröße einen der folgenden Schritte aus:

  Klicken Sie auf den Pfeil nach unten, um den Abstand der Fehlerellipsen-Markierung zu verkleinern.

  Klicken Sie auf den Pfeil nach oben, um den Abstand der Fehlerellipsen-Markierung zu vergrößern.

Die Maßstabsleiste wird länger, wenn der Abstand vergrößert wird und der Abstand zwischen den Markierungen wird dem in der Markierungssteuerung eingegebenen Wert angepaßt. Umgekehrt wird die Maßstabsleiste kürzer, wenn der Wert für die Markierungseinstellung verringert wird.


Fehlerellipsen und Pfeile filtern

Weitere Informationen

Siehe auch	Wie kann ich ...
Überblick

Die Fehlerellipsen und Pfeile, die nach einer Ausgleichung in einem Graphikfenster angezeigt werden, können unter Verwendung der Schaltflächen auf der Fehlerellipsen-Symbolleiste oder im Dialogfeld Ansichtsoptionen gefiltert werden.

HINWEIS: Das Kontrollkästchen Punktfehlerellipsen & Pfeile anzeigen im Dialogfeld Ansichtsoptionen und die Fehlerellipsen-Schaltfläche auf der Ellipsenparameter-Symbolleiste sind miteinander verbunden. Wenn eine Einstellung geändert wird, ist die andere Einstellung ebenfalls davon betroffen. Die Verwendung der Ellipsenparameter-Symbolleiste bietet zusätzliche Vorteile. Weitere Informationen finden Sie unter Ellipsenparameter-Symbolleiste.

So filtern Sie die Fehlerellipsen und Pfeile mit der Ellipsenparameter-Symbolleiste:

1.	Aktivieren Sie die Ellipsenparameter-Symbolleiste.

2.	Klicken Sie auf die Schaltfläche [image], um die Fehlerellipsen und Pfeile zu filtern. 	Die Fehlerellipsen werden ein- bzw. ausgeblendet, je nachdem, ob sie aktiviert oder deaktiviert waren, als auf die Schaltfläche geklickt wurde. Wenn die Schaltflächen Ellips. Höhenfehler und Höhenfehler gewählt werden, werden die Pfeile für die ellipsoidischen Höhenfehler und die Höhenfehler ebenfalls angezeigt.

3.	Führen Sie in der Ellipsenparameter-Symbolleiste einen oder beide der folgenden Schritte aus:

  Klicken Sie auf die Schaltfläche [image], um Pfeile für ellipsoidische Höhenfehler zu filtern.

  Klicken Sie auf die Schaltfläche [image], um Pfeile für orthometrische Höhenfehler zu filtern.

Die ellipsoidischen und orthometrischen Höhenfehler werden jedesmal, wenn Sie auf die entsprechende Schaltfläche klicken, ein- oder ausgeblendet.

So filtern Sie die Fehlerellipsen und Pfeile im Dialogfeld Ansichtsoptionen:

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie das Register Fehlerellipsen-Steuerungen.

3.	Wählen Sie das Kontrollkästchen Puntkfehlerellipsen & Pfeile anzeigen.

Die Fehlerellipsen und Pfeile werden jedesmal, wenn das Kontrollkästchen gewählt wird, ein- oder ausgeblendet.


Eigenschaftsfenster - Fehlerschätzungsseite
    Eigenschaftsfenster − Fehlerschätzungsseite

Weitere Informationen

 Siehe auch

Überblick

Die Fehlerschätzungsseite enthält die nach einer Netzausgleichung bestimmten Punktfehler. Diese Seite steht nur zur Verfügung, wenn Sie das Netzausgleichungsmodul installiert haben.
Sie können die Eigenschaftsseite ansehen, nachdem Sie eine Netzausgleichung durchgeführt haben.

So greifen Sie auf die Fehlerschätzungsseite zu:

1.	Doppelklicken Sie auf den Punkt, den Sie ansehen möchten. Das Eigenschaftsfenster mit dem ausgewählten Punkt erscheint.

2.	Klicken Sie im Register Vermessung auf die Schaltfläche Fehlerschätzung [image].

Die Fehlerschätzungsseite erscheint. Sie enthält folgende Felder.

Hochwert, Rechtswert

In diesem Feld werden die mittleren Fehler in den horizontalen Koordinatenkomponenten angezeigt.

Höhe, Ellips. Höhe

In diesem Feld werden die mittleren Fehler in den vertikalen Koordinatenkomponenten angezeigt.

Vertrauensintervall

In diesem Feld wird der Vertrauensgrad der Ergebnisse für die fortgepflanzten Fehler angezeigt.