Copyright: © 1999-2002 Trimble Navigation Limited


Eine GPS-Verarbeitungssitzung abbrechen

 Überblick und weitere Informationen

Wenn eine GPS-Verarbeitungssitzung beginnt, führt das Verarbeitungsprogramm eine kontinuierliche Folge von Verarbeitungsdurchgängen für alle gewählten Basislinien durch. Die Anzahl der Durchgänge und die Vorgänge werden von den Einstellungen im GPS-Verarbeitungsstil gesteuert und sind auch von den Resultaten vorheriger Durchgänge abhängig. Sie können diese Vorgänge beenden, indem Sie die aktuelle GPS-Verarbeitungssitzung abbrechen.

Wenn die GPS-Verarbeitung abgebrochen wird, beendet das Programm die Berechnung, sobald es den Befehl zum Abbruch erhält. Beachten Sie bitte, daß es in einigen Situationen etwas dauern kann, bis das Verarbeitungsprogramm stoppt, wenn Sie auf Abbrechen klicken.

So brechen Sie die GPS-Verarbeitung ab:

1.	Klicken Sie auf Abbrechen. Das GPS-Verarbeitungsprogramm fordert Sie auf, das Abbrechen zu bestätigen.

2.	Führen Sie einen der nachfolgenden Schritte aus:

  Klicken Sie auf Ja, um das Abbrechen der Verarbeitungssitzung zu bestätigen.

  Klicken Sie auf Nein, um mit der Verarbeitung fortzufahren.


Den Besetzungszeitraum ändern

 Überblick und weitere Informationen

Der Zeitraum einer statischen Besetzung oder eines kontinuierlichen kinematischen Besetzungssegments kann verkürzt werden. Sie können den Zeitraum ändern, indem Sie:

  die Besetzungseigenschaften bearbeiten.

  das Besetzungselement direkt bearbeiten.

In den nachfolgenden Abschnitten wird beschrieben, wie der Besetzungszeitraum mit Hilfe dieser Methoden geändert werden kann.

So ändern Sie den Zeitraum für die Besetzungseigenschaften:

1.	Führen Sie einen der nachfolgenden Schritte aus, um die Besetzungseigenschaften anzusehen:

   Doppelklicken Sie auf das Besetzungselement.

   Klicken Sie mit der rechten Maustaste auf das Besetzungssegment, und wählen Sie dann Eigenschaften.

Das Dialogfeld Besetzung/Datensegmenteigenschaften erscheint.

2.	Bearbeiten Sie die Felder Startzeit und Stoppzeit.

Der Zeitraum kann nur verkürzt werden.

3.	Klicken Sie auf OK.

Das Dialogfeld wird geschlossen. Die Änderungen werden im Besetzungselement angezeigt. Das Element wird als Rechteck mit schwarzer Umrandung dargestellt. Die schwarze Umrandung gibt den ursprünglichen Besetzungszeitraum des Besetzungselements an. Der farbig ausgefüllte Bereich des Rechtecks zeigt den Zeitraum des bearbeiteten Besetzungselements an.

So ändern Sie den Zeitraum:

1.	Positionieren Sie den Mauszeiger über der vorderen Kante des Besetzungselements.

Der Cursor wird zu einem horizontalen Doppelpfeil.

2.	Drücken Sie auf die linke Maustaste, und halten Sie sie gedrückt.

3.	Beobachten Sie das Zeit-Lineal, während Sie die vordere Kante der Besetzung mit der Maus nach rechts ziehen.

Wenn die vordere Kante bewegt wird, bewegt sich ebenfalls der farbig ausgefüllte Bereich. Die schwarze Umrandung des Rechtecks bleibt an ihrer ursprünglichen Position.

HINWEIS: Ein leerer (nicht farbig ausgefüllter Teil) eines Besetzungselements weist darauf hin, daß die Besetzungszeitspanne geändert wurde.

4.	Lassen Sie die linke Maustaste los, wenn die vordere Kante der Besetzung mit der auf dem Zeit-Lineal angezeigten Zeit übereinstimmt.

5.	Wiederholen Sie die vorstehenden Schritte für die hintere Kante der Besetzung. Ziehen Sie den Mauszeiger dabei in die entgegengesetzte Richtung.


Einen GPS-Basislinienverarbeitungsbericht analysieren

 Überblick und weitere Informationen

Nach der Verarbeitung der GPS-Basislinien können Warnkennzeichnungen im Graphikfenster angezeigt werden. Bei GPS-Basislinien erscheint eine Warnkennzeichnung in der Mitte der Basislinie, die einen oder mehrere Qualitätsprüfungstests nicht bestanden hat, die im aktiven GPS-Verarbeitungsstil festgelegt wurden. Mit einer kleinen Warnflagge gekennzeichnete Basislinien sollten genauer überprüft werden, um festzustellen, warum diese Lösungen mit einer Warnkennzeichnung versehen wurden. Es sind möglicherweise eine Reihe von Problembehebungsschritten erforderlich, um die Gesamtqualität der Basislinienlösung durch eine Neuberechnung mit einem anderen GPS-Verarbeitungsstil zu verbessern.

Analysieren und korrigieren Sie die Daten für die einzelnen Basislinien nacheinander. Beheben Sie die Probleme für eine bestimmte Basislinienlösung, und berechnen Sie diese Basislinie erneut, bevor Sie die nächste Basislinie analysieren.

Sehen Sie sich die Berichtstatistik der Basislinie im GPS-Basislinienverarbeitungsbericht  an. Beantworten Sie die folgenden Fragen:

  Welcher Lösungstyp wurde verwendet?

  Wie ist das Verhältnis im Bezug zur Referenzvarianz?

  Was ist die Schrägstrecke?

  Wurde zu einem anderen Zeitpunkt eine redundante Basislinie gemessen, deren Schrägstrecke und Basislinienkomponenten als Vergleich herangezogen werden könnten?

Wenn diese Antworten nicht weiterhelfen, versuchen Sie, die folgenden Fragen zu beantworten:

  Wie lange dauerte die Besetzungszeit?

  Liegt der RMS unter 15mm?

  Treten in den Verfolgungszusammenfassungen Lücken in den verarbeiteten Segmenten auf?

  Sind die Restwerte-Plots symmetrisch um Null angeordnet, innerhalb eines Bereichs von 15mm?

Um die Ergebnisse der Verhältnis-, Referenzvarianz- und RMS-Tests zu analysieren, müssen Sie wissen, welche Kriterien für die Akzeptanz bzw. die Zurückweisung von Basislinienlösungen festgelegt wurden.

Andere GPS-Verarbeitungsstileinstellungen können die Ergebnisse dieser Akzeptanztests ebenfalls beeinflussen. Sie sollten sich mit diesen Steuerungen vertraut machen, um zu verstehen, wann Lösungen akzeptiert oder verworfen werden. Weitere Informationen finden Sie unter Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

Diese Problemlösungsschritte können die Statistik Ihrer Basislinien verbessern. Wenden Sie die Problemlösungsschritte an, bevor Sie ins Feld zurückkehren. Diese Techniken sind nach Schwierigkeitsgrad und Effektivität aufgelistet. Wenn das Problem mit Hilfe der vorstehenden Schritte gelöst werden kann, ist es womöglich nicht erforderlich, eine oder mehrere Basislinien im Feld erneut zu besetzen.

Problembehebung:

  Einen Satelliten deaktivieren

  Phasensprünge bearbeiten

  Ungültige Entfernungsdaten bearbeiten

  Die Höhenmaske bearbeiten und heraufsetzen

Weitere Informationen über Basislinienverarbeitungssitzungen finden Sie unter Basislinienverarbeitungsprotokoll.


Satellitenverfolgungsdaten in SV-Plots analysieren

 Überblick und weitere Informationen

Die Satellitenverfolgungsinformationen können im SV-Plot Fenster graphisch dargestellt und analysiert werden, um Unstimmigkeiten aufzudecken.

Mehrere Satellitenverfolgungsplots können im selben SV-Plot Fenster geplottet werden, um Daten zu vergleichen. Neue Fenster können ebenfalls erstellt werden, um zusätzliche Plot-Sätze anzuzeigen.

Darüber hinaus können die Bildschirmplots gedruckt werden und die Informationen, die zur Erstellung des Plots verwendet wurden, können im Tabellenformat in eine Datei exportiert werden.

So plotten Sie die Daten:

1.	Führen Sie einen der nachfolgenden Schritte aus, um die Timeline-Ansicht aufzurufen:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

Timeline erscheint.

2.	Klicken Sie auf einen Datenordner.

Datenordner werden in der Steuerleiste angezeigt. Ein [image] -Symbol erscheint wenn Datenordner geschlossen sind. Das Symbol [image] erscheint, wenn die Ordner geöffnet sind.

Datenordner zeigen das Modell und die Seriennummer des Empfängers an, der zur Datenerfassung verwendet wurde. Doppelklicken Sie auf einen Datenordner, um die Empfänger-Informationen für die erfassten Daten anzusehen.

Ist ein Ordner geöffnet, werden in der Steuerleiste Symbole für alle Satelliten angezeigt, die im Vermessungszeitraum verfolgt wurden.

HINWEIS: Statt einzelne Ordner zu öffnen, können Sie auch den Befehl Alle expandieren verwenden, um alle Datenordner zu öffnen.

3.	Doppelklicken Sie auf ein Satelliten-Symbol.

Das SV-Plot Fenster erscheint.

4.	Führen Sie einen der nachfolgenden Schritte aus, um Satellitenverfolgungsplots anzuzeigen:

  Wählen Sie einen oder mehrere Plots, indem Sie auf die entsprechenden Schaltflächen in der Dialogleiste klicken.

  Wählen Sie einen oder mehrere Befehle aus dem Datenuntermenü unter Ansicht / Daten.

Alle Daten, die für den gewählten Satelliten im Beobachtungszeitraum erfasst wurden, werden geplottet.

5.	Überprüfen Sie die graphisch dargestellten Satellitenverfolgungsinformationen visuell auf mögliche Unstimmigkeiten in den Daten.

Wenn der Plot angezeigt wird, können Sie folgende Vorgänge durchführen:

Plot-Messungen anzeigen:

1.	Bewegen Sie den Mauszeiger zu der gewünschten Stelle im Plot.

2.	Lesen Sie die Meß- und Zeitinformationen in der Statusleiste ab.

Der Meß- und Zeitwerte werden für die Position, über der sich der Mauszeiger befindet, in der Statusleiste angezeigt.

Den Plot drucken:

1.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Drucken zu wählen:

  Wählen Sie Datei / Drucken.

  Drücken Sie Strg+P.

  Klicken Sie auf die Schaltfläche [image] in der Symbolleiste.

Das Dialogfeld Drucken erscheint.

2.	Wählen Sie die gewünschten Optionen.

3.	Klicken Sie auf OK.

Der Plot wird gedruckt.

Den Plot in eine Datei drucken:

1.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Drucken zu wählen:

  Wählen Sie Datei / Drucken.

  Drücken Sie Strg+P.

 Klicken Sie auf die Schaltfläche [image] in der Symbolleiste.

Das Dialogfeld Drucken erscheint.

2.	Wählen Sie die Option Ausdruck in Datei.

3.	Klicken Sie auf OK.

Der Plot wird in eine Datei gedruckt. Viele Programme können graphische Daten in eine Datei importieren. Dies ist nützlich, wenn Sie Plots in Berichte einfügen möchten.

Daten im Tabellenformat drucken:

1.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Exportieren zu wählen:

  Wählen Sie Datei / Exportieren.

  Drücken Sie Alt+DE.

Das Dialogfeld Speichern unter erscheint.

2.	Wählen Sie das Verzeichnis und den Dateinamen, unter dem die Datei gespeichert werden soll.

Die Satellitenverfolgungsinformationen, die zur Erstellung des Plots verwendet wurden, werden in eine Textdatei (*.txt) geschrieben und im ausgewählten Ordner gespeichert. Die Daten werden im Tabellenformat in die Datei geschrieben. Wenn mehrere Plots im selben SV-Plot-Fenster angezeigt werden, wird für jeden Plottyp eine Tabellenspalte erstellt.


Einen statischen Besetzungstyp ändern

 Überblick und weitere Informationen

Der Besetzungstyp einer statischen Besetzung kann geändert werden.

So ändern Sie den Besetzungstyp:

1.	Doppelklicken Sie auf das Besetzungselement. Das Dialogfeld Besetzung/Datensegmenteigenschaften erscheint.

2.	Öffnen Sie die Liste Segmenttyp.

3.	Wählen Sie einen der folgenden Besetzungstypen:

  Statische Besetzung

  Kontinuierliches Segment

  Bewegtes Segment

4.	Klicken Sie auf OK.

Die Änderungen werden gespeichert.

WARNUNG: Sie können ein kontinuierliches Segment oder ein bewegtes Segment nicht wieder in eine statische Besetzung ändern. Seien Sie daher vorsichtig, wenn Sie den Besetzungstyp ändern.


Einen kontinuierlichen Segmenttyp ändern

 Überblick und weitere Informationen

Der Besetzungstyp eines kontinuierlichen kinematischen Segments kann geändert werden.

So ändern Sie den Besetzungstyp:

1.	Doppelklicken Sie auf das Besetzungselement. Das Dialogfeld Besetzung/Datensegmenteigenschaften erscheint.

2.	Öffnen Sie die Liste Segmenttyp.

3.	Wählen Sie einen der folgenden Besetzungstypen:

  Kontinuierliches Segment

  Bewegtes Segment

4.	Klicken Sie auf OK.

Die Änderungen werden gespeichert.

HINWEIS:  Sie können den Besetzungstyp eines kontinuierlichen kinematischen Segments nur in ein bewegtes Segment ändern. Kontinuierliche oder bewegte Segmente können nicht in eine statische Besetzung geändert werden.


Die Zeitoptionen in Timeline ändern

 Überblick und weitere Informationen

Die Zeiteinheiten im Zeit-Lineal können auf GPS Wochen/Sekunden oder auf die Windows-Ortszeit eingestellt werden.

So ändern Sie die Zeiteinheiten:

1.	Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Optionen Zeitanzeige anzuzeigen:

  Doppelklicken Sie im Zeit-Lineal.

  Klicken Sie mit der rechten Maustaste im Zeit-Lineal, und wählen Sie Zeitoptionen.

Das Dialogfeld Optionen Zeitanzeige erscheint.

2.	Wählen Sie eines der folgenden Zeitformate:

  Ortszeit (das Windows-Zeitanzeigeformat)

  GPS Wochen/Sekunden

3.	Klicken Sie auf OK.

Die Felder für die Anfangs- und Endzeit werden im Zeit-Lineal aktualisiert, um die geänderten Zeiteinheiten anzuzeigen. Die Zeiteinheiten in Timeline Eigenschaftsdialogfeldern, im Sky-Plot, DOP-Plot, SV-Plot und in der Statusleiste werden ebenfalls geändert.


Phasensprünge in GPS-Beobachtungen korrigieren

 Überblick und weitere Informationen

Phasensprünge, die in Satellitenverfolgungsplots von GPS-Beobachtungen enthalten sind, können bearbeitet werden, um sie aus zukünftigen Basislinienverarbeitungssitzungen zu entfernen. Phasensprünge sollten nur bearbeitet werden, wenn eine Basislinienlösung aufgrund hoher Beobachtungsrestwerte mit einer Warnkennzeichnung versehen wurde und in der Timeline-Ansicht eine große Anzahl von Phasensprüngen entdeckt wurden.

HINWEIS: In der Regel werden Phasensprünge automatisch vom Verarbeitungsprogramm behoben, und es ist keine manuelle Bearbeitung erforderlich. Phasensprünge können vor oder nach der Basislinienverarbeitung bei der Überprüfung der GPS-Beobachtungen in Timeline entdeckt werden. Die problematischen Daten sind in den Satellitenplots der GPS-Beobachtungen erkennbar. Das Erscheinungsbild von Phasensprüngen und anderen Unterbrechungen bei der Satellitenverfolgung wird unter GPS-Beobachtungen behandelt.

So bearbeiten Sie Phasensprünge:

1.	Drucken Sie den GPS-Basislinienverarbeitungsbericht für die gekennzeichnete Basislinie.

Trimble empfiehlt, die Verarbeitungsresultate für die gekennzeichnete Basislinienlösung auszudrucken, bevor Sie fortfahren. Wenn die Basislinienlösung später neu berechnet wird, können Sie den Ausdruck verwenden, um die Ergebnisse beider Verarbeitungssitzungen zu vergleichen.

2.	Prüfen Sie die GPS-Beobachtungen im Plot auf sichtbare Anzeichen von Phasensprüngen.

3.	Ziehen Sie mit der Maus ein Auswahlrechteck um den Phasensprung.

Timeline wählt die Verfolgungsinformationen für die L1- und L2-Trägerphasen automatisch aus. Unter Schritt 6. können Sie die L1- und L2-Trägerphasendaten löschen.

4.	Führen Sie einen der nachfolgenden Schritte aus, um die GPS-Beobachtungseigenschaften anzusehen:

  Doppelklicken Sie auf das Auswahlrechteck.

  Klicken Sie mit der rechten Maustaste auf das Rechteck, und wählen Sie Eigenschaften.

Das Dialogfeld GPS-Beobachtungseigenschaften erscheint.

5.	Bearbeiten Sie die Start- oder Stoppzeit oder beide Felder.

Wenn Sie die Beobachtungszeit ändern, um bestimmte Daten zu ignorieren, wird der Phasensprung aus künftigen GPS-Verarbeitungssitzungen entfernt. Wenn Sie die Basislinien später erneut verarbeiten, ignoriert das Verarbeitungsprogramm die Daten bei der Berechnung neuer Lösungen für gekennzeichnete Basislinien.

6.	Deaktivieren Sie die Kontrollkästchen für die entsprechenden Beobachtungstypen. Dadurch wird festgelegt, welche Beobachtungen für die festgelegte Zeitspanne deaktiviert werden.

7.	Klicken Sie auf OK, um die Änderungen anzuwenden. Das Dialogfeld wird geschlossen. Die deaktivierten Satellitenverfolgungsdaten im Auswahlrechteck werden grau dargestellt. Die Farbänderung weist darauf hin, daß das Verarbeitungsprogramm die Daten bei zukünftigen Verarbeitungssitzungen nicht länger zur Berechnung von Basislinienlösungen verwendet.

8.	Wählen Sie Vermessung / GPS-Basislinien verarbeiten, um die Basislinien erneut zu verarbeiten. Das Dialogfeld GPS-Verarbeitung erscheint, und die Verarbeitung beginnt.

9.	Wählen Sie die Lösung aus der GPS-Verarbeitungsliste.

10.	Klicken Sie auf Bericht. Der GPS-Basislinienverarbeitungsbericht erscheint.

11.	Vergleichen Sie die Resultate der Neuberechnung mit den Ergebnissen der vorherigen Verarbeitungssitzung.

12.	Führen Sie einen der nachfolgenden Schritte aus, wenn Sie die beiden Basislinienverarbeitungssitzungen verglichen haben:

  Wenn sich die Schrägstrecke und die Statistik der Basislinie verbessert haben, speichern Sie die Basislinienlösung in Ihrem Netz.

  Wenn nichts auf eine Verbesserung hindeutet, kehren Sie zum Dialogfeld GPS-Beobachtungseigenschaften zurück. Aktivieren Sie die deaktivierten Beobachtungstypen erneut, und klicken Sie dann auf OK.


Ungültige Entfernungsdaten in GPS-Beobachtungen korrigieren

 Überblick und weitere Informationen

Im Gegensatz zu Phasensprüngen, sind ungültige Entfernungsdaten nur selten in den Satellitenverfolgungsplots einer GPS-Beobachtung enthalten. Falls dies doch geschieht, können sie bearbeitet und aus zukünftigen GPS-Basislinienverarbeitungssitzungen entfernt werden. Ungültige Entfernungsdaten sollten nur bearbeitet werden, wenn eine Basislinienlösung aufgrund hoher Beobachtungsrestwerte gekennzeichnet wurde, und bei der Überprüfung in Timeline ungültige Entfernungsdaten gefunden werden.

HINWEIS: Ungültige Entfernungsdaten können sowohl vor als auch nach der Verarbeitung von GPS-Basislinien bei der Überprüfung der GPS-Beobachtungen in Timeline entdeckt werden. Die problematischen Daten sind in den Satellitenplots von GPS-Beobachtungen einfach zu erkennen. Das Erscheinungsbild von ungültigen Entfernungsdaten, Phasensprüngen und anderen Lücken in der Satellitenphasenverfolgung wird im Abschnitt GPS-Beobachtungen erläutert.

So bearbeiten Sie ungültige Entfernungsdaten:

1.	Drucken Sie den GPS-Basislinienverarbeitungsbericht für die gekennzeichnete Basislinie.

Trimble empfiehlt, die Verarbeitungsresultate für die gekennzeichnete Basislinienlösung auszudrucken, bevor Sie fortfahren. Wenn die Basislinienlösung später neu berechnet wird, können Sie den Ausdruck verwenden, um die Resultate mit den Ergebnissen der nächsten GPS-Verarbeitungssitzung zu vergleichen.

2.	Prüfen Sie die GPS-Beobachtungen auf Anzeichen von ungültigen Entfernungsdaten.

3.	Ziehen Sie mit der Maus ein Auswahlrechteck um die ungültigen Daten.

Timeline wählt die Verfolgungsinformationen für die L1- und L2-Trägerphasen automatisch aus. Unter Schritt 6. Können Sie die L1- und L2-Trägerphasendaten löschen.

4.	Führen Sie einen der nachfolgenden Schritte aus, um die GPS-Beobachtungseigenschaften anzusehen:

  Doppelklicken Sie auf das Rechteck.

  Klicken Sie mit der rechten Maustaste auf das Rechteck, und wählen Sie Eigenschaften.

Das Dialogfeld GPS-Beobachtungseigenschaften erscheint.

5.	Bearbeiten Sie die Start- oder Stoppzeit oder beide Felder.

Wenn Sie die Beobachtungszeit ändern, um bestimmte Daten zu ignorieren, wird der Phasensprung aus künftigen GPS-Verarbeitungssitzungen entfernt. Wenn Sie die Basislinien später erneut verarbeiten, ignoriert das Verarbeitungsprogramm die Daten bei der Berechnung neuer Lösungen für gekennzeichnete Basislinien.

6.	Deaktivieren Sie die Kontrollkästchen für die entsprechenden Beobachtungstypen. 	Dadurch wird festgelegt, welche Beobachtungen für die festgelegte Zeitspanne deaktiviert werden.

7.	Klicken Sie auf OK, um die Änderungen anzuwenden.

Das Dialogfeld wird geschlossen. Die deaktivierten Satellitenverfolgungsdaten im Auswahlrechteck werden grau dargestellt. Die Farbänderung weist darauf hin, daß das Verarbeitungsprogramm die Daten bei zukünftigen Verarbeitungssitzungen nicht länger zur Berechnung von Basislinienlösungen verwendet.

8.	Führen Sie einen der nachfolgenden Schritte aus, um Basislinien neu zu berechnen:

  Wählen Sie Vermessung / GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und die Verarbeitung beginnt.

9.	Wählen Sie die Lösung aus der GPS-Verarbeitungsliste.

10.	Klicken Sie auf Bericht. Der GPS-Basislinienverarbeitungsbericht erscheint.

11.	Vergleichen Sie die Resultate der Neuberechnung mit den Ergebnissen der vorherigen Verarbeitungssitzung.

12.	Führen Sie einen der nachfolgenden Schritte aus, wenn Sie die beiden Basislinienverarbeitungssitzungen verglichen haben:

  Speichern Sie die Basislinienlösung in Ihrem Projekt, wenn sich das Ergebnis verbessert hat.

  Kehren Sie zum Satelliten-Symbol zurück, und aktivieren Sie die Messungen für diesen Satelliten erneut, wenn nichts auf eine Verbesserung hindeutet.


Einen Satelliten deaktivieren

 Überblick und weitere Informationen

Sie können die GPS-Beobachtungen in Timeline ansehen, um Probleme, die bei der Basislinienverarbeitung aufgetreten sind, zu identifizieren. Folgende Probleme können auftreten:

  Phasensprünge, ungültige Phasen und zahlreiche Lücken in der L1- oder L2-Verfolgung.

  Schlechte Satellitengeometrie, vor allem, wenn ein oder mehrere Satelliten deaktiviert sind.

HINWEIS: Wenn ein Satellit deaktiviert wird, werden automatisch auch die damit verknüpften GPS-Beobachtungen deaktiviert. Es ist möglich, einzelne GPS-Beobachtungen und ausgewählte Bereiche einer GPS-Beobachtung zu deaktivieren. Weitere Informationen finden Sie unter Phasensprünge korrigieren und Ungültige Entfernungsdaten korrigieren.

So deaktivieren Sie einen Satelliten:

VORSICHT: Vergewissern Sie sich, daß sich das Entfernen eines Satelliten nicht nachteilig auf die Geometrie der Satellitenkonstellation auswirkt, bevor Sie den Satelliten entfernen.

1.	Führen Sie einen der nachfolgenden Schritte aus, um Timeline anzuzeigen:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

Timeline erscheint.

2.	Identifizieren Sie den Datenordner, der die Daten enthält. Suchen Sie danach nach dem Vermessungselement, das die Besetzungszeit für die Satelliten enthält, die Sie deaktivieren möchten. Verwenden Sie den Befehl Zeitraum zoomen, um das Vermessungselement in der Timeline-Ansicht zu vergrößern.

Sie können den entsprechenden Ordner auf zwei Arten identifizieren: Das Empfänger-Modell und die Seriennummer sind auf dem Ordner selbst angegeben, und das Vermessungselement enthält eine Beschriftung mit der Kennung der Vermessungssitzung.

3.	Klicken Sie auf das [image] Symbol, um den Datenordner zu öffnen.

Die Symbole für die einzelnen Satelliten, die zur Vermessung beigetragen haben, erscheinen in der Steuerleiste. In der Zeitraum-Ansicht werden die GPS-Beobachtungselemente für jeden Satelliten angezeigt.

HINWEIS: Wenn Sie die Daten aller Satelliten in der Zeitraum-Ansicht ansehen möchten, können Sie die Größe des Timeline-Ansichtsbereichs ändern.

4.	Überprüfen Sie die GPS-Beobachtungselemente auf Lücken.

Lücken in der L1- und L2-Trägerphase könnten auf Phasensprünge, ungültige Entfernungsdaten oder auf andere Unterbrechungen des Trägerphasensignals hinweisen. Weitere Informationen über das Auftreten von Phasensprüngen und anderen Trägerphasenprobleme finden Sie unter GPS-Beobachtungen.

5.	Klicken Sie mit der rechten Maustaste auf ein Satelliten-Symbol.

6.	Wählen Sie Aktivieren/Deaktivieren. Das GPS-Beobachtungselement wird in einer Grauschattierung dargestellt, wenn Daten deaktiviert sind.

7.	Wählen Sie die Basislinie.

8.	Führen Sie einen der nachfolgenden Schritte aus, um die Lösung neu zu berechnen:

  Wählen Sie Vermessung / GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und die Basislinienverarbeitung beginnt.

9.	Wählen Sie die Lösung aus der GPS-Verarbeitungsliste.

10.	Klicken Sie auf Bericht. Der GPS-Basislinienverarbeitungsbericht erscheint.

11.	Vergleichen Sie die Resultate der Neuberechnung mit den Ergebnissen der vorherigen Verarbeitungssitzung.

12.  Führen Sie einen der nachfolgenden Schritte aus, wenn Sie die beiden Basislinienverarbeitungssitzungen verglichen haben:

   Speichern Sie die Basislinienlösung in Ihrem Projekt, wenn sich das Ergebnis verbessert hat.

   Kehren Sie zum Satelliten-Symbol zurück, und aktivieren Sie die Messungen für diesen Satelliten erneut, wenn nichts auf eine Verbesserung hindeutet.


GPS-Beobachtungen in Timeline deaktivieren

 Überblick und weitere Informationen

In Timeline können Sie einzelne GPS-Beobachtungselemente, Gruppen von GPS-Beobachtungen oder alle GPS-Beobachtungen für einen bestimmten Satelliten deaktivieren. Vergewissern Sie sich, daß sich das Entfernen eines Satelliten nicht nachteilig auf die Geometrie der Satellitenkonstellation auswirkt, bevor Sie GPS-Beobachtungen deaktivieren.

HINWEIS: Ausgewählte Bereiche von GPS-Beobachtungen und ausgewählte Verfolgungsrohdaten können bearbeitet werden, um die allgemeine Beobachtungsqualität zu verbessern. Ein Beispiel für diese Technik finden Sie unter Ungültige Entfernungsdaten korrigieren.

So deaktivieren Sie individuelle GPS-Beobachtungen:

1.	Klicken Sie auf die aktivierte GPS-Beobachtung.

2.	Klicken Sie mit der rechten Maustaste auf die GPS-Beobachtung.

3.	Wählen Sie Aktivieren/Deaktivieren.

Die aktivierte GPS-Beobachtung wird deaktiviert. Ihr Erscheinungsbild ändert sich, um den deaktivierten Status wiederzugeben.

So deaktivieren Sie Gruppen von GPS-Beobachtungen:

1.	Ziehen Sie mit der Maus ein Auswahlrechteck um die Gruppe der GPS-Beobachtungen.

2.	Klicken Sie mit der rechten Maustaste in das Rechteck.

3.	Wählen Sie Aktivieren/Deaktivieren.

Die aktivierten Beobachtungen werden deaktiviert. Ihr Erscheinungsbild ändert sich, um den deaktivierten Status wiederzugeben.

So deaktivieren Sie alle GPS-Beobachtungen für einen bestimmten Satelliten:

1.	Klicken Sie auf das Satelliten-Symbol, das mit den GPS-Beobachtungen verknüpft ist.

2.	Klicken Sie mit der rechten Maustaste auf das Symbol.

3.	Wählen Sie Aktivieren/Deaktivieren.

Der Satellit und alle damit verbundenen GPS-Beobachtungen werden deaktiviert.


Die Akzeptanzkriterien für die GPS-Verarbeitung bearbeiten

Drei Qualitätsprüfungstests während der GPS-Verarbeitung (der Verhältnistest, der Referenzvarianztest und der RMS-Test) dienen der Qualitätsprüfung bei der Akzeptanz und Zurückweisung von Basislinienlösungen.

So bearbeiten Sie die Akzeptanzkriterien:

1.	Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld GPS-Verarbeitungsstile anzuzeigen:

  Wählen Sie Vermessung / GPS-Verarbeitungsstile.

  Drücken Sie Alt+VV.

Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie den aktiven Stil aus der Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint. Der Stilname wird in der Titelleiste des Dialogfelds angezeigt.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Klicken Sie auf das Register Qualität. Die Qualitäts-Optionen werden angezeigt. Die Gruppe Akzeptanzkriterien enthält Kontrollkästchen, mit denen die drei Akzeptanztests aktiviert und deaktiviert werden. In diesem Dialogfeld werden die Tests als ‘Wenn Verhältnis‘, ‘Wenn Referenzvarianz‘ und ‘Wenn RMS‘ bezeichnet. Vier Dateneingabefelder stehen für jeden Test zur Verfügung - je zwei Kennzeichnungsfelder (Kennz.) und zwei Zurückweisungsfelder (Zurückw.) für Einfrequenz- und Zweifrequenz-Empfänger.

HINWEIS: Es gibt zwei Situationen, in denen die Einfrequenz-Akzeptanzkriterien für eine Basislinie verwendet werden: Erstens, wenn mindestens einer der Empfänger, der zur Erfassung der Basisliniendaten verwendet wurde, ein Einfrequenz-Empfänger ist.
 Zweitens, wenn die Basislinienlänge unter dem endgültigen Grenzwert liegt, der im Register Iono des aktiven GPS-Verarbeitungsstils festgelegt wurde.

6.	Aktivieren oder deaktivieren Sie den Verhältnistest, indem Sie das Kontrollkästchen Wenn Verhältnis wählen oder deaktivieren.

7.	Geben Sie einen Kennzeichnungswert für Ein- oder Zweifrequenz-Empfänger ein.

8.	Geben Sie einen Zurückweisungswert für Ein- oder Zweifrequenz-Empfänger ein.

9.	Aktivieren oder deaktivieren Sie den Referenzvarianztest, indem Sie das Kontrollkästchen Wenn Referenzvarianz wählen oder deaktivieren.

10.	Geben Sie einen Kennzeichnungswert für Ein- oder Zweifrequenz-Empfänger ein.

11.	Geben Sie einen Zurückweisungswert für Ein- oder Zweifrequenz-Empfänger ein.

12.	Aktivieren oder deaktivieren Sie den RMS-Test, indem Sie das Kontrollkästchen Wenn RMS wählen oder deaktivieren.

13.	Geben Sie einen Kennzeichnungswert für Ein- oder Zweifrequenz-Empfänger ein.

14.	Geben Sie einen Zurückweisungswert für Ein- oder Zweifrequenz-Empfänger ein.

15.	Bearbeiten Sie das Feld Multiplikator bearbeiten, und klicken Sie auf OK.

Die Änderungen werden gespeichert.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die Akzeptanzkriterien zu ändern. Eine Ausnahme bildet die ‘Nur Code‘-Lösung im letzten Durchgang. ‘Nur Code‘-Lösungen werden nach den im voreingestellten Trimble-Verarbeitungsstil festgelegten Kriterien gekennzeichnet. Es ist empfehlenswert, einen ‘Nur Code‘-Verarbeitungsstil mit den gewünschten Kriterien zu erstellen, wenn häufig ‘Nur Code‘-Lösungen im letzten Durchgang verarbeitet werden.


Die Ereignis-Optionen im GPS-Verarbeitungsstil bearbeiten

Die Ereignis-Optionen im Dialogfeld GPS-Verarbeitungsstil werden für die Ableitung von Ereignispositionen bei der Verarbeitung kontinuierlicher kinematischer Vermessungen mit Ereignismarkierungen verwendet.

So bearbeiten Sie die Ereignisoptionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie im Register Ereignisse eine Interpolationsmethode.

3.	Geben Sie in die verbleibenden Felder folgendes ein:

  Anzahl einzufügender Punkte

  Maximal zulässige fehlende Epochen

  Zeit-Offset (in Mikrosekunden)

4.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die Ionospähren-Optionen im GPS-Verarbeitungstil bearbeiten
Die Ionosphären-Optionen im GPS-Verarbeitungsstil bearbeiten

 Überblick und weitere Informationen

Die Ionosphären-Optionen im GPS-Verarbeitungsstil werden zur Kompensation von Ionosphärenfehlern bei der Auflösung von Mehrdeutigkeiten und bei den letzten Verarbeitungsiterationen verwendet.

So bearbeiten Sie die Ionosphären-Optionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Iono.

3.	Klicken Sie auf das Kontrollkästchen ‘Gilt für alle Basislinien länger als‘ in der Gruppe Durchgang zur Auflösung von Mehrdeutigkeiten, um diese Option zu aktivieren oder zu deaktivieren. Geben Sie den entsprechenden Streckenwert ein, wenn die Option aktiviert ist.

4.	Klicken Sie auf das Kontrollkästchen ‘Gilt für alle Basislinien länger als‘ in der Gruppe Letzter Durchgang, um diese Option zu aktivieren oder zu deaktivieren. Geben Sie den entsprechenden Streckenwert ein, wenn die Option aktiviert ist.

5.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die kinematischen Optionen im GPS-Verarbeitungsstil bearbeiten

Die kinematischen Optionen im GPS-Verarbeitungsstil werden bei der Verarbeitung kinematischer Beobachtungen angewendet.

So bearbeiten Sie die kinematischen Optionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Kinematisch.

3.	Geben Sie folgendes in die entsprechenden Felder ein:

  Minimale Referenzbeobachtungszeit (in Sekunden)

  Minimale Beobachtungszeit für statische Initialisierung (in Sekunden)

  Minimales Initialisierungsverhältnis für bekannten Punkt (ein Verhältnis)

  Minimale OTF-Berechnungszeit (in Sekunden)

4.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die Optionen für die OTF-Suche im GPS-Verarbeitungsstil bearbeiten

Die Optionen für die OTF-Suche im GPS-Verarbeitungsstil werden für On-the-Fly-Suchen bei den GPS-Verarbeitungsiterationen verwendet.

So bearbeiten Sie die Optionen für die OTF-Suche:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register OTF-Suche.

3.	Wählen Sie in der Gruppe Suchmethode die erforderliche Option. Wenn Sie die Suchoptionen Sequentielle Suche vorwärts oder Sequentielle Suche rückwärts wählen, wird das Feld in der Gruppe Sequentielle Steuerung verfügbar.

4.	Geben Sie ein minimales Suchverhältnis ein.

5.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die Qualitäts-Optionen im GPS-Verarbeitungsstil bearbeiten

Die Qualitäts-Optionen im GPS-Verarbeitungsstil werden zur Aktivierung/Deaktivierung und zur Definition der Verhältnis-, RMS- und Referenzvarianztests verwendet. Bei diesen Tests wird die Qualität einer Basislinie bewertet, bevor sie im Projekt gespeichert wird.

Basislinien, die die Kriterien für die Akzeptanzprüfung nicht erfüllen, werden gemäß Voreinstellung nicht im Projekt gespeichert. Gekennzeichnete Basislinien werden im Projekt gespeichert. Rote Warnkennzeichnungen (kleine rote Flaggen) werden in der Mitte der Basislinie angezeigt. Sie weisen darauf hin, daß die Basislinie auf ihre Qualität überprüft werden sollte. Weitere Informationen über die Kennzeichnung von Basislinien finden Sie unter Datenanalyse.

So bearbeiten Sie die Qualitäts-Optionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Qualität.

3.	Klicken Sie in der Gruppe Akzeptanzkriterien auf die Kontrollkästchen Wenn Verhältnis, Wenn Referenzvarianz und Wenn RMS, um diese Tests zu aktivieren oder zu deaktivieren.

4.	Wählen Sie die entsprechenden Kennzeichnungs- oder Zurückweisungsfelder für jeden Test, und geben Sie die gewünschten Werte ein.

HINWEIS: Trimble empfiehlt, die Voreinstellungen nicht zu ändern. Sie können für die meisten Vermessungsanwendungen verwendet werden.

5.	Geben Sie einen Wert in das Feld Multiplikator bearbeiten ein.

6.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die statischen Optionen im GPS-Verarbeitungsstil bearbeiten

Die Statischen Optionen im GPS-Verarbeitungsstil werden bei der Verarbeitung von Basisliniendaten verwendet, die mit statischen Vermessungsmethoden aufgezeichnet wurden.

So bearbeiten Sie die statischen Optionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Statisch.

3.	Geben Sie in das Feld Minimale Beobachtungszeit für Basislinie einen Wert in Sekunden ein.

Dies ist die Mindestbeobachtungszeit für die Verarbeitung von Messungen, die von zwei oder mehreren Empfängern zur selben Zeit durchgeführt wurden. Das Verarbeitungsprogramm benötigt Daten, die über einen Zeitraum 120 Sekunden gleichzeitig aufgezeichnet wurden, um eine Basislinie zwischen Empfängern berechnen zu können. Dadurch wird ein zufälliges Überlappen zwischen mehreren Rovern vermieden. Die Voreinstellung beträgt 120 Sekunden.

4.	Führen Sie im Feld ‘Maximale Basislinienlänge für Fixed-Lösung einen der folgenden Schritte aus:

  Geben Sie in das Feld Broadcast-Ephemeriden verwenden eine Basislinienstrecke (in Projekteinheiten) ein. Die Voreinstellung beträgt 200 Kilometer.

  Geben Sie in das Feld Genaue Ephemeriden verwenden eine Basislinienstrecke (in Projekteinheiten) ein. Die Voreinstellung beträgt 2000 Kilometer.

5.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die Troposphären-Optionen im GPS-Verarbeitungsstil bearbeiten

Die Troposphären-Optionen im GPS-Verarbeitungsstil werden für die Troposphären-Korrekturen bei der Basislinienverarbeitung verwendet.

So bearbeiten Sie die Tropo-Optionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Tropo.

3.	Wählen Sie in der Modell-Liste das entsprechende Troposphären-Modell.

4.	Geben Sie in das Feld Geschätztes Zenit-Verzögerungsintervall einen Wert in Stundeneinheiten ein

Das empfohlene Mindestschätzungsintervall beträgt eine Stunde. Die Voreinstellung ist 2 Stunden. Wenn ein Wert von Null (0) eingegeben wird, wird keine Zenit-Verzögerungsschätzung durchgeführt. Diese Feld steht nicht zur Verfügung, wenn das Troposphären-Modell auf ‘Keine‘ eingestellt ist.

5.	Aktivieren Sie das Kontrollkästchen Beobachtete Met-Daten verwenden, um meteorologische Daten bei der Verarbeitung der GPS-Lösungen zu verwenden. Met-(meteorologische) Daten enthalten die Lufttemperatur, den Luftdruck und die relative Luftfeuchtigkeit.

  Wenn dieses Kontrollkästchen gewählt ist, werden die beobachteten meteorologischen Daten in der GPS-Datei oder die aus einer RINEX-Datei importierten Daten für die Troposphären-Modellierung bei der Berechnung der Zenit-Verzögerung benutzt. Dieses Kontrollkästchen ist gemäß Voreinstellung aktiviert.

  Deaktivieren Sie diese Option, wenn Sie Standard-Met-Werte anstelle der beobachteten Met-Daten verwenden möchten.

6.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


GPS-Verarbeitungstile bearbeiten
GPS-Verarbeitungsstile bearbeiten

 Überblick und weitere Informationen

Zwei Dialogfelder stehen für die Bearbeitung der GPS-Verarbeitungsstile zur Verfügung. Das erste Dialogfeld enthält die allgemeinen Einstellungen. Zusätzliche erweiterte Einstellungen können im zweiten Dialogfeld bearbeitet werden, um die Feinabstimmung des GPS-Verarbeitungsstils vorzunehmen. Anfänglich enthalten beide Dialogfelder die voreingestellten Stil-Einstellungen, die für die meisten Vermessungsanwendungen geeignet sind.

So bearbeiten Sie die allgemeinen Stil-Optionen:

1.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie Vermessung / GPS-Verarbeitungsstile.

  Drücken Sie Alt+VV.

Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Geben Sie in das Feld Höhenmaske einen Wert für die Höhenmaske ein. Die in diesem Feld festgelegte Höhenmaske deaktiviert die Höhenmaske, die zur Datenerfassung im Feld verwendet wurde.

5.	Wählen Sie in der Ephemeriden-Liste die Option Broadcast oder Genau. Wenn Broadcast gewählt wird, verwendet das GPS-Verarbeitungsprogramm die Broadcast-Ephemeriden von allen Satelliten, die zur Vermessungssitzung beigetragen haben. Wenn die Option Genau gewählt wird, verwendet das GPS-Verarbeitungsprogramm die aktuellen genauen Ephemeriden, die in das Projekt importiert wurden.

6.	Wählen Sie in der Lösungstyp-Liste Code, Float, oder Fixed.

7.	Führen Sie einen der nachfolgenden Schritte aus:

  Wenn Sie nur die allgemeinen Einstellungen ändern möchten, klicken Sie auf OK, um die Änderungen zu speichern.

  Führen Sie weitere Schritte durch, um die erweiterten Optionen zu bearbeiten.

So bearbeiten Sie die erweiterten Optionen:

  Klicken Sie im Dialogfeld Stil bearbeiten auf Fortgeschritten.

Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint. Es enthält folgende Register:

  Statisch

  Kinematisch

  Global

  Qualität

  Tropo

  Iono

  Ereignisse

  OTF-Suche

Klicken Sie auf OK, Nachdem Sie die entsprechenden Stil-Optionen bearbeitet haben. Die Änderungen werden gespeichert, und Sie kehren zum Dialogfeld Stil bearbeiten zurück.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die globalen Optionen im GPS-Verarbeitungsstil bearbeiten

Die globalen Optionen im GPS-Verarbeitungsstil werden bei jedem GPS-Verarbeitungsdurchgang berücksichtigt.

So bearbeiten Sie die globalen Optionen:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Global.

3.	Wählen Sie in der Frequenztypen-Liste L1, L2, Narrow lane or Wide lane.

4.	Geben Sie in die verbleibenden Felder folgendes ein:

  den maximal behebbaren Phasensprung (in Sekunden)

  die maximalen Iterationen (einen ganzzahligen Wert) − das GPS-Basislinienverarbeitungsprogramm führt dann bei der Berechnung der einzelnen Basislinienlösungen nur die maximalen Iterationen aus.

  das maximale Zeitlimit für die Ganzzahl-Suche (einen ganzzahligen Wert in Minuten) − das GPS-Verarbeitungsprogramm beendet die Verarbeitungsiterationen und berechnet eine Float-Lösung, sobald dieses Zeitlimit verstrichen ist.

5.	Klicken Sie auf OK, wenn keine weiteren Änderungen erforderlich sind.

Die Änderungen werden gespeichert.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die erweiterten Steuerungen zu ändern. Sie sollten sich darüber informieren, was diese Änderungen bewirken, bevor Sie sie speichern und den geänderten Stil als aktiven Stil verwenden.


Die Basislinienlänge für den Durchgang zur Auflösung von Mehrdeutigkeiten bearbeiten

Dieses Kontrollkästchen aktiviert oder deaktiviert das Ionosphären-Korrekturmodell während des GPS-Verarbeitungsdurchgangs zur Auflösung von Mehrdeutigkeiten. Der in das Feld ‘Gilt für alle Basislinien länger als’ eingegebene Streckenwert bestimmt die minimale Basislinienlänge oder den Schwellenwert für die Anwendung von Ionosphären-Korrekturmodellen.

HINWEIS: Ionosphären-Modelle werden nur auf Basislinien angewendet, die mit Zweifrequenz-Empfängern beobachtet wurden

So bearbieten Sie diesen Wert:

1.	Öffnen Sie das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten.

2.	Wählen Sie das Register Iono.

3.	Wählen Sie das Kontrollkästchen ‘Gilt für alle Basislinien länger als’ in der Gruppe Durchgang zur Auflösung von Mehrdeutigkeiten.

Wenn das Kontrollkästchen ausgewählt ist, wendet das GPS-Verarbeitungsprogramm ein Ionosphären-Modell zur Korrektur der Ionosphären-Verzerrungen an. Die Iono-Korrekturmethode wird automatisch ausgewählt, je nachdem, ob Ein- oder Zweifrequenzdaten in der Projektdatenbank vorhanden sind. Einer der nachfolgenden Vorgänge wird ausgeführt, wenn das Kontrollkästchen gewählt ist:

  Wenn alle Projektdaten mit Zweifrequenz-Empfängern aufgezeichnet wurden, versucht das GPS-Verarbeitungsprogramm, ionosphärische Störungen durch ein Ionosphären-Korrekturmodell zu modellieren und entfernt diese Störungen, um einen iono-freien Beobachtungswert zu erzeugen. Dies wird für alle Basislinien durchgeführt, die den im Feld ‘Gilt für alle Basislinien länger als’ eingegebenen Wert überschreiten. Die Ionosphärenkorrekturen beginnen bei der Code-Lösung, und die Modellierung wird bei jeder nachfolgenden Lösung graduell verbessert.

  Wenn mindestens eine Datei mit einem Einfrequenz-Empfänger aufgezeichnet wurde, verwendet das GPS-Verarbeitungsprogramm die in den Broadcast-Ephemeriden enthaltenen Daten, um den Ionosphärenfehler zur Hälfte zu entfernen.

4.	Geben Sie in das Feld ‘Gilt für alle Basislinien länger als’ in der Gruppe ‘Durchgang zur Auflösung von Mehrdeutigkeiten‘ einen Streckenwert (in Projekteinheiten) ein.

Gemäß Voreinstellung sind die Ionosphären-Korrekturen für den Durchgang zur Auflösung von Mehrdeutigkeiten für alle Basislinien von über 10 km Länge aktiviert.


Timeline-Elemente filtern

 Überblick und weitere Informationen

In der Timeline-Symbolleiste stehen Befehle zum Filtern der Graphikelemente in der Zeitraum-Ansicht zur Verfügung.

Ephemeriden-Symbole filtern

Wählen Sie den Befehl Ephemeriden, um die Ephemeriden-Symbole in der Zeitraum-Ansicht zu filtern. Jedesmal, wenn dieser Befehl gewählt wird, werden die Ephemeriden-Symbole ein- oder ausgeblendet.

Führen Sie einen der nachfolgenden Schritte aus, um die Ephemeriden-Symbole zu filtern:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht, und wählen Sie Ansicht Filter / Ephemeriden.

  Klicken Sie auf die Schaltfläche [image] in der Timeline-Symbolleiste.

Kontinuierliche kinematische Besetzungssegmente filtern

Wählen Sie den Befehl Kontinuierlich, um die kontinuierlichen Segmente in der Zeitraum-Ansicht zu filtern. Jedesmal, wenn dieser Befehl gewählt wird, werden die kontinuierlichen Segmente ein- oder ausgeblendet.

Führen Sie einen der nachfolgenden Schritte aus, um Besetzungssegmente zu filtern:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht, und wählen Sie Ansicht Filter / Kontinuierlich.

  Klicken Sie auf die Schaltfläche [image] in der Timeline-Symbolleiste.

Satelliten und die damit verbundenen GPS-Beobachtungen filtern

Der Befehl Satelliten kann verwendet werden, um die Satelliten und die GPS-Beobachtungselemente in der Zeitraum-Ansicht zu filtern. Jedesmal, wenn dieser Befehl gewählt wird, werden die Satelliten-Symbole und GPS-Beobachtungselemente ein- oder ausgeblendet.

Führen Sie einen der nachfolgenden Schritte aus, um Satelliten zu filtern:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht, und wählen Sie Ansicht Filter / Satelliten.

  Klicken Sie auf die Schaltfläche [image] in der Timeline-Symbolleiste.

Ereignis-Symbole filtern

Wählen Sie den Befehl Ereignisse, um die Ereignisse in der Zeitraum-Ansicht zu filtern. Jedesmal wenn dieser Befehl gewählt wird, werden die Ereignis-Symbole ein- oder ausgeblendet. Es müssen Ereignisdaten im Projekt vorhanden sein, damit diese Schaltfläche verfügbar ist.

So filtern Sie Ereignisse:

 Klicken Sie auf die Schaltfläche [image] in der Timeline-Symbolleiste.


Spalten in der GPS-Verarbeitungsliste verschieben

 Überblick und weitere Informationen

Die Spalten in der GPS-Verarbeitungsliste können an eine neue Position in der Liste verschoben werden. Die Verschiebung ist nur temporär. Die Spalten werden bei der nächsten Verarbeitungssitzung an ihre ursprüngliche Position zurückgesetzt.

So verschieben Sie Spalten:

1.	Positionieren Sie den Cursor auf der Kopfzeile der Spalte.

Die Kopfzeile enthält den Spaltentitel und befindet sich über der ersten Datenreihe.

2.	Führen Sie einen der folgenden Vorgänge aus:

  Um eine Spalte nach rechts zu verschieben: ziehen Sie den Spaltenkopf nach rechts, bis die linke Seite des Spaltenkopfes über die Position hinausgeht, an der Sie die Spalte einfügen möchten, und lassen Sie dann die Maustaste los.

  Um eine Spalte nach links zu verschieben: ziehen Sie den Spaltenkopf nach links, bis die rechte Seite des Spaltenkopfes über die Position hinausgeht, an der Sie die Spalte einfügen möchten, und lassen Sie dann die Maustaste los.


Mit der Zeitraum-Ansicht durch Timeline navigieren

Führen Sie die nachfolgenden Vorgänge aus, um die Timeline in der Zeitraum-Ansicht zu verschieben:

  Verwenden Sie die Bildlaufleisten, um die Timeline nach links oder rechts zu verschieben.

  Ändern Sie die Start- und Stoppzeit-Felder, um zu einem bestimmten Zeitraum zu verschieben.

  Verwenden Sie den Befehl Zoom-Ausdehnung, um den Gesamtzeitraum anzusehen.

  Verwenden Sie den Befehl Zeitraum zoomen, um das ausgewählte Element auf die Breite der Zeitraum-Ansicht zu zoomen.

  Verwenden Sie den Befehl Nächste, um die Ansicht zum Endpunkt der nächsten Besetzung zu verschieben.

  Verwenden Sie den Befehl Vorhergehend, um die Ansicht zum Startpunkt der vorhergehenden Besetzung zu verschieben.

Führen Sie folgende Vorgänge aus, um Daten vertikal anzusehen:

  Ziehen Sie die obere Begrenzung des Timeline-Ansichtsbereichs nach oben oder unten, um mehr bzw. weniger Informationen anzuzeigen.

  Öffnen oder schließen Sie die Datenordner in der Steuerleiste, um weitere Informationen anzusehen.

  Verwenden Sie die vertikalen Bildlaufleisten, um nach oben oder unten durch die Daten zu rollen.

Beachten Sie folgende Richtlinien:

  Sie können auf die meisten Timeline-Elemente doppelklicken, um ihre Dateneigenschaften anzusehen.

  Sie können mit der rechten Maustaste auf die meisten Timeline-Elemente und Fensterhintergründe klicken, um ein Menü mit Befehlen anzuzeigen. Jedes Menü enthält Befehle, die im ausgewählten Fenster oder auf das ausgewählte Element angewendet werden können.

  Einige Timeline-Bildschirmansichten stehen nur zur Verfügung, wenn bestimmte Elemente gewählt wurden. Das SV-Plot Menü erscheint nur als Menübefehl oder als aktive Befehlsschaltfläche, wenn ein Satelliten-Symbol gewählt wurde. Die Befehle DOP-Plot und Sky-Plot stehen ebenfalls nur in Menüs oder auf Symbolleisten zur Verfügung, wenn ein Besetzungs-, Vermessungs- oder Ephemeriden-Symbol gewählt ist.

Weitere Informationen finden Sie unter folgenden Themen:

  Die nächste oder vorhergehende Besetzung ansehen

  Timeline-Datenordner

  Timeline-Menüs

  Timeline-Symbolleisten

  Zusätzliche Timeline-Anzeigen

  Timeline-Eigenschaftsdialogfelder

  Timeline-Befehle


Satellitenrohdaten plotten

 Überblick und weitere Informationen

Satellitenrohdaten werden durch Auswählen der Schaltflächen auf der Dialogleiste oder mit Hilfe der Optionen im Menü Ansicht / Daten in den SV-Plot geplottet. Die Daten können nicht nur geplottet, sondern auch gedruckt werden. Die aufgezeichneten Satelliteninformationen können zur Plot-Dokumentation in eine Datei exportiert werden.

So plotten Sie Satellitenverfolgungsdaten:

1.	Führen Sie einen der nachfolgenden Schritte aus, um Timeline anzuzeigen:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

Der Timeline-Ansichtsbereich erscheint.

2.	Klicken Sie auf einen Datenordner.

Datenordner werden in der Steuerleiste in der linken unteren Ecke des Timeline-Ansichtsbereichs angezeigt. Ein [image] -Symbol wird angezeigt, wenn die Ordner geschlossen und ein [image] -Symbol wird angezeigt, wenn die Ordner geöffnet sind. Auf den Datenordnern sind die Modell- und die Seriennummer des Empfängers angegeben, der zur Datenerfassung verwendet wurde. Ist ein Ordner geöffnet, werden Symbole für alle während des Besetzungszeitraums verfolgten Satelliten angezeigt.

HINWEIS: Sie können auch den Befehl Alle expandieren verwenden, um alle Datenordner zu öffnen.

3.	Doppelklicken Sie auf ein Satelliten-Symbol.

Das Satelliten-Symbol wird hervorgehoben, und das SV-Plot Fenster erscheint.

4.	Führen Sie einen der nachfolgenden Schritte aus, um die Daten zu plotten:

  Klicken Sie auf die gewünschte Schaltfläche in der Dialogleiste.

  Wählen Sie die gewünschten Plot-Befehle im Menü Ansicht / Daten.

Wenn der Plot angezeigt wird, können Sie folgende Vorgänge durchführen:

Plot-Messungen anzeigen:

  Bewegen Sie den Mauszeiger zur gewünschten Stelle im Plot und lesen Sie die Meß- und Zeitinformationen in der Statusleiste ab. Der an dieser Position aufgezeichnete Wert und die Zeit der Datenerfassung werden in der Statusleiste angezeigt.

Einen anderen Plot im selben Fenster anzeigen:

  Wählen Sie den gewünschten Plot-Befehl aus der Dialogleiste oder wählen Sie das Datenuntermenü unter Ansicht / Daten.

Die ausgewählten Daten werden im selben Plot-Fenster neben dem ersten Plot geplottet.

Den Plot drucken:

1.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie Datei / Drucken.

  Drücken Sie Strg+P.

  Klicken Sie auf die Schaltfläche [image] in der Symbolleiste.

Das Dialogfeld Drucken erscheint.

2.	Wählen Sie die gewünschten Optionen.

3.	Klicken Sie auf OK.

Der Plot wird gedruckt.

Den Plot in eine Datei drucken:

1.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie Datei / Drucken.

  Drücken Sie Strg+P.

  Klicken Sie auf die Schaltfläche [image] in der Symbolleiste.

Das Dialogfeld Drucken erscheint.

2.	Wählen Sie die Option Ausdruck in Datei.

3.	Klicken Sie auf OK.

Der Plot wird in eine Datei gedruckt. Viele Programme können graphische Daten in eine Datei importieren. Dies ist von Nutzen, wenn Sie Plots in Berichte integrieren möchten.

Daten im Tabellenformat drucken:

1.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Exportieren zu wählen:

  Wählen Sie Datei / Exportieren.

  Drücken Sie Alt+DE.

Das Dialogfeld Speichern unter erscheint.

2.	Wählen Sie das Verzeichnis und den Dateinamen, unter dem die Datei gespeichert werden soll.

Die Satellitenverfolgungsinformationen, die zur Erstellung des Plots verwendet wurden, werden in eine Textdatei (*.txt) geschrieben und im ausgewählten Verzeichnis gespeichert. Die Daten werden im Tabellenformat in die Datei geschrieben. Wenn mehrere Plots im selben SV-Plot Fenster angezeigt werden, wird für jeden Plottyp eine Tabellenspalte erstellt.

HINWEIS: Zusätzliche Plotfenster können mit dem Befehl Datei / Neuer Plot geöffnet werden. Jedes SV-Plot Fenster kann verschiedene Plots anzeigen. Sie können Fenster minimieren oder maximieren und andere allgemeinen Vorgänge durchführen, um die Fensteranzeige im SV-Plot zu steuern.


Den Timeline-Ansichtsbereich drucken

 Überblick und weitere Informationen

Der Inhalt des Timeline-Ansichtsbereichs kann im Hoch- oder Querformat gedruckt werden.

HINWEIS: Passen Sie die Größe des Ansichtsbereichs vor dem Drucken an. Nur die im Ansichtsbereich enthaltenen Daten werden gedruckt.

So drucken sie den Timeline-Ansichtsbereich:

1.	Führen Sie einen der nachfolgenden Schritte aus, um Timeline anzuzeigen:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

2.	Klicken Sie auf den Hintergrund der Steuerleiste, die Zeitraum-Ansicht oder auf das Zeit-Lineal.

3.	Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Drucken anzuzeigen:

  Wählen Sie Datei / Plotten/Drucken.

  Drücken Sie Strg+P.

Das Dialogfeld Drucken erscheint.

4.	Führen Sie einen der nachfolgenden Schritte aus, um den Ansichtsbereich zu drucken:

  Klicken Sie auf OK, um den Ansichtsbereich im Hochformat zu drucken.

  Klicken Sie auf Eigenschaften, auf Querformat, und dann zweimal auf OK, um den Bericht im Querformat zu drucken.

Der Timeline-Ansichtsbereich wird automatisch an das Druckformat angepaßt.


Basislinien verarbeiten

 Überblick und weitere Informationen

Individuelle Basislinien oder Basisliniensätze können zur Verarbeitung ausgewählt werden.

So verarbeiten Sie alle Basislinien:

1.	Öffnen Sie ein Projekt, das GPS-Rohdatendateien enthält.

2.	Klicken Sie auf den Hintergrund des Graphikfensters.

Sie müssen auf einen Bereich im Graphikfenster klicken, in dem keine Daten geplottet sind, andernfalls wird die Auswahl aller gewählten Elemente rückgängig gemacht. Wenn keine Basislinien im Graphikfenster gewählt sind, wählt das Basislinienverarbeitungsprogramm automatisch alle potentiellen Basislinien zur Verarbeitung aus.

3.	Führen Sie einen der nachfolgenden Schritte aus, um Basislinien zu verarbeiten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

HINWEIS: Sie können die GPS-Verarbeitungssitzung jederzeit abbrechen, indem Sie auf Abbrechen klicken.

Während der GPS-Verarbeitungssitzung werden Statusinformationen in der Statusleiste des Dialogfelds angezeigt. Folgende Statistiken werden angezeigt:

  Der Statusindikator auf der linken Seite der Statusleiste gibt Auskunft über den Verarbeitungsstatus der einzelnen Basislinien.

  Das zweite Indikatorfeld zeigt Meldungen an, die während der GPS-Verarbeitung erzeugt wurden. Individuelle Start- und Endpunkte für Basislinien werden im Verlauf der Verarbeitungssitzung angezeigt.

  Die Anzahl der zu verarbeitenden Dateien und die Anzahl der noch zu verarbeitenden Basislinien werden im dritten Indikatorfeld von rechts auf der Statusleiste angezeigt. Das Indikatorfeld zeigt ‘Anstehend‘ an, wenn alle Basislinien verarbeitet, die berechneten Lösungen aber noch nicht mit Speichern im Projekt gespeichert wurden.

  Der Statusindikator ganz rechts gibt die Anzahl aller akzeptierten und verworfenen Basislinien an.

Im Verlauf der Verarbeitungsitzung erscheinen die Verarbeitungsergebnisse für jede ausgewählte Basislinie als einzeilige Zusammenfassung in der GPS-Verarbeitungsliste. Akzeptierte Basislinienlösungen sind daran zu erkennen, daß ein Häkchen in der linken Spalte der GPS-Verarbeitungsliste angezeigt wird.

Einzelne Basislinien, deren Lösungen mit einer Warnkennzeichnung versehen wurden, sind im Graphikfenster mit kleinen roten Flaggen markiert.

So verarbeiten Sie eine Auswahl von Basislinien:

1.	Wählen Sie die zu verarbeitende(n) Basislinie(n) im Graphikfenster mit einer der folgenden Methoden aus:

  Ziehen Sie mit der Maus ein Auswahlrechteck um eine Gruppe von Basislinien.

  Halten Sie die Taste Strg gedrückt, während Sie auf mehrere Basislinien klicken.

TIP: Sie können die Auswahl einer Basislinie rückgängig machen, indem Sie die Taste Strg gedrückt halten und erneut auf die Basislinie klicken.

2.	Führen Sie einen der nachfolgenden Schritte aus, um Basislinien zu verarbeiten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und die Verarbeitung beginnt.

Nachdem Basislinien verarbeitet wurden, können Sie den GPS-Basislinienverarbeitungsbericht ansehen und die Resultate für individuelle Basislinienlösungen analysieren. Weitere Informationen finden Sie unter Einen GPS-Basislinienverarbeitungsbericht analysieren.

Nachdem Sie die Berichtsdaten für einzelne Lösungen überprüft haben, können Sie die Basislinienlösungen speichern.

HINWEIS: Nachdem Sie Basislinien verarbeitet haben und das Dialogfeld GPS-Verarbeitung geschlossen ist, können Sie auf den Warnkennzeichnungsindikator in der Statusleiste der Vermessungsansicht doppelklicken. Das Eigenschaftsfenster wird geöffnet. Es enthält die Basislinien, denen Warnkennzeichnungen zugeordnet wurden. Sie können die Basislinienordner in der Auswahl-Liste öffnen, um zu überprüfen, warum diese Basislinien mit einer Kennzeichnung versehen wurden. Die Warnkennzeichnungsseite gibt an, ob die Basislinie beim Verhältnis-, Referenzvarianz- oder RMS-Tests gekennzeichnet wurde oder andere Gründe für die Kennzeichnung vorliegen (z. B. Schleifenschlußfehler). Es kann hilfreich sein, zu wissen, warum Basislinienlösungen gekennzeichnet wurden, damit das Problem in Zukunft vermieden werden kann. Weitere Informationen finden Sie unter Einen GPS-Basislinienverarbeitungsbericht analysieren.

Bei der Verarbeitung von GPS-Daten muß eine ganze Reihe von Faktoren berücksichtigt werden. Weitere Informationen über die Verarbeitung von GPS-Basislinien finden Sie unter folgenden Themen:

  Potentielle Basislinien bestimmen

  Basislinien zur Verarbeitung auswählen

  Einen GPS-Verarbeitungsstil wählen

  Das GPS-Basislinienverarbeitungsprogramm starten

  Die Verarbeitungsresultate ansehen

  Die Verarbeitungsresultate speichern

  Basislinien erneut verarbeiten


Problematische Basislinien erneut berechnen
Problematische Basislinien erneut verarbeiten

 Überblick und weitere Informationen

Diese Problemlösungsstrategie ist von der Dauer der Sitzung abhängig. Verkürzen Sie die Besetzungszeit am Anfang oder am Ende der Sitzung, wenn genügend Daten und eine ausreichende Anzahl von Satelliten für die Berechnung der Basislinie vorhanden sind. Dieses Verfahren ist besonders nützlich, wenn die Daten am Sitzungsanfang oder -ende ein hohes Datenrauschen aufweisen oder viele Phasensprünge enthalten.

So verarbeiten Sie die Basislinie erneut:

1.	Führen Sie einen der nachfolgenden Schritte aus, um Timeline anzuzeigen:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

2.	Expandieren Sie den Datenordner, der die Vermessungsdaten enthält.

3.	Klicken Sie mit der rechten Maustaste auf die GPS-Beobachtung.

4.	Wählen Sie Eigenschaften. Das Dialogfeld GPS-Beobachtungseigenschaften erscheint.

5.	Geben Sie die neue Start- und Stoppzeit ein.

6.	Klicken Sie auf OK.

7.	Klicken Sie auf die problematische Basislinie.

8.	Führen Sie einen der nachfolgenden Schritte aus, um die Basislinie zu verarbeiten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

 	Die individuelle Basislinienlösung wird neu berechnet, und die Resultate werden im Dialogfeld GPS-Verarbeitung angezeigt.


Besetzungen in Timeline auswählen

 Überblick und weitere Informationen

Das Graphikfenster und Timeline sind miteinander verbunden. Beachten Sie folgende Richtlinien, wenn Sie Elemente im Graphikfenster oder im Timeline-Ansichtsbereich wählen:

  Wenn Sie Besetzungen in Timeline wählen, werden die entsprechenden Punkte auch im Graphikfenster ausgewählt.

  Wenn Sie eine Basislinie im Graphikfenster auswählen, werden die beiden Besetzungen, aus denen die Basislinie besteht, in Timeline ebenfalls gewählt.

  Wenn Sie einen Punkt im Graphikfenster wählen, wählt Timeline alle mit diesem Punkt verbundenen Besetzungen.

Ein Farbcodierschema wird zur Identifikation der unterschiedlichen Besetzungstypen und Datensegmente verwendet, die in der Zeitraum-Ansicht dargestellt werden. Weitere Informationen finden Sie unter Farbcodierschema.

So wählen Sie Besetzungen in Timeline aus:

  Klicken Sie auf die Besetzung.

Die Besetzung wird hervorgehoben, um anzuzeigen, daß sie ausgewählt wurde.

So wählen Sie Besetzungen durch Auswählen einer Basislinie im Graphikfenster:

  Klicken Sie auf die Basislinie im Graphikfenster.

Die beiden Besetzungen, die mit der Basislinie verknüpft sind, werden in der Zeitraum-Ansicht gewählt.

So wählen Sie Besetzungen durch Auswählen eines Punktes im Graphikfenster:

  Ziehen Sie mit der Maus ein Auswahlrechteck um den Punkt.

Die Besetzung, die mit dem Punkt verknüpft ist, wird in der Zeitraum-Ansicht gewählt.

TIP: Beobachtungen und Punkte können ebenfalls im Eigenschaftsfenster ausgewählt werden, und umgekehrt. Sie können das Eigenschaftsfenster auch geöffnet lassen, während Sie in Timeline oder im Graphikfenster arbeiten, um die Eigenschaften der gewählten Elemente anzusehen.


Die Einstellungen für den GPS-Basislinienverarbeitungsbericht bearbeiten

Abschnitte des GPS-Basislinienverarbeitungsberichts können aktiviert oder deaktiviert werden, um den Inhalt des Berichts festzulegen.

So legen Sie die Berichteinstellungen fest:

1.	Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Einstellungen GPS-Basislinienverarbeitungsbericht aufzurufen:

  Wählen Sie Berichte / Einstellungen / Bericht GPS-Basislinienverarbeitung.

  Drücken Sie Alt+REB.

Das Dialogfeld Einstellungen GPS-Basislinienverarbeitungsbericht erscheint.

2.	Wählen oder deaktivieren Sie die Kontrollkästchen, um die Berichtabschnitte festzulegen, die im GPS-Basislinienverarbeitungsbericht enthalten sein sollen.


Die GPS-Verarbeitung starten

 Überblick und weitere Informationen

So starten Sie die GPS-Verarbeitung:

1.	Wählen Sie die gewünschten Basislinien in der Vermessungsansicht. Wenn Sie keine Basislinie wählen, werden alle potentiellen Basislinien verarbeitet.

2.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung wird geöffnet, und die Verarbeitung beginnt.

HINWEIS: Sie können die GPS-Verarbeitungssitzung jederzeit abbrechen, indem Sie auf Abbrechen klicken.

Während der GPS-Verarbeitungssitzung werden Statusinformationen in der Statusleiste des Dialogfelds angezeigt. Folgende Statistiken werden angezeigt:

  Der Statusindikator auf der linken Seite der Statusleiste gibt Auskunft über den Verarbeitungsstatus der einzelnen Basislinien.

  Das zweite Indikatorfeld zeigt Meldungen an, die während der GPS-Verarbeitung erzeugt wurden. Individuelle Start- und Endpunkte für Basislinien werden im Verlauf der Verarbeitungssitzung angezeigt.

  Die Anzahl der zu verarbeitenden Dateien und die Anzahl der noch zu verarbeitenden Basislinien werden im dritten Indikatorfeld von rechts auf der Statusleiste angezeigt. Das Indikatorfeld zeigt ‘Anstehend‘ an, wenn alle Basislinien verarbeitet, die berechneten Lösungen aber noch nicht mit Speichern im Projekt gespeichert wurden.

  Der Statusindikator ganz rechts gibt die Anzahl aller akzeptierten und zurückgewiesenen Basislinien an. Die Akzeptanzkriterien werden im Dialogfeld GPS-Verarbeitungsstile festgelegt.

Während der Verarbeitung werden die Verarbeitungsergebnisse für jede ausgewählte Basislinie als einzeilige Zusammenfassung in der GPS-Verarbeitungsliste angezeigt. Akzeptierte Basislinienlösungen sind daran zu erkennen, daß ein Häkchen in der linken Spalte der GPS-Verarbeitungsliste erscheint. Wenn kein Häkchen angezeigt wird, hat die Basislinie die Akzeptanzkriterien nicht bestanden.

Gekennzeichnete Basislinien werden akzeptiert und ihre Lösungen werden gespeichert. Sie sollten aber nach der GPS-Verarbeitungssitzung überprüft werden, um festzustellen, warum Sie mit einer Warnkennzeichnung versehen wurden. Einzelne Basislinien, deren Lösungen mit einer Warnkennzeichnung versehen wurden, sind im Graphikfenster mit kleinen roten Flaggen markiert.

So können Sie einzelne Basislinien manuell zurückweisen, bevor die Lösungen gespeichert werden.

1.	Wählen Sie die gewünschte Basislinienlösung aus der GPS-Verarbeitungsliste.

2.	Deaktivieren Sie das Kontrollkästchen in der linken Spalte.

So können Sie einen GPS-Basislinienverarbeitungsbericht für einzelne Basislinienlösungen ansehen:

1.	Wählen Sie die gewünschte Basislinienlösung aus der GPS-Verarbeitungsliste.

2.	Klicken Sie auf Bericht. Der GPS-Basislinienverarbeitungsbericht erscheint.

Weitere Informationen finden Sie unter GPS-Basislinienverarbeitungsbericht.

3.	Wiederholen Sie, falls erforderlich, die vorstehend genannten Schritte, um zusätzliche Berichte anzusehen.

TIP: Sie können den GPS-Basislinienverarbeitungsbericht für eine Basislinie nach der GPS-Verarbeitung ansehen. Wählen Sie dazu im Graphikfenster die gewünschte(n) Basislinie(n), und wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung.

Alle akzeptierten Basislinienlösungen können im Projekt gespeichert werden.

Das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ legt fest, wie Basislinien nach einer Neuberechnung gespeichert werden. Das Kontrollkästchen ist gemäß Voreinstellung aktiviert. Das bedeutet, daß bestehende Basislinienlösungen überschrieben werden. Wenn das Kontrollkästchen deaktiviert ist, wird die neue Lösung im Projekt gespeichert und die alte Lösung wird ebenfalls beibehalten. Die neue Lösung wird dabei zur aktiven Lösung, die alte Lösung wird inaktiv. Im Eigenschaftsfenster kann eine alte inaktive Lösung wieder als aktive Lösung gewählt werden.

Das Kontrollkästchen Doppelte Basislinienlösungen überschreiben gilt nur für Basislinien, die mehrfach berechnet wurden. Basislinien, die zwischen denselben Punkten zu einem anderen Zeitpunkt oder an einem anderen Tag aus GPS-Daten berechnet wurden, sind hiervon nicht betroffen. Trimble empfiehlt, alte Basislinienlösungen immer zu überschreiben.

So speichern Sie Basislinienlösungen:

  Klicken Sie auf Speichern.

Die akzeptierten Basislinienlösungen werden im Projekt gespeichert.

So brechen Sie eine GPS-Verarbeitungssitzung ab:

  Klicken Sie auf Abbrechen.

Bei der Verarbeitung von GPS-Daten muß eine Reihe von Faktoren berücksichtigt werden. Weitere Informationen über die GPS-Basislinienverarbeitung finden Sie unter folgenden Themen:

  Potentielle Basislinien bestimmen

  Basislinien zur Verarbeitung auswählen

  Einen GPS-Verarbeitungsstil wählen

  Das GPS-Basislinienverarbeitungsprogramm starten

  Die Verarbeitungsresultate ansehen

  Die Verarbeitungsresultate speichern

  Basislinien erneut verarbeiten


Die Höhenmaske bearbeiten und heraufsetzen

 Überblick und weitere Informationen

Verwenden Sie diese Problemlösungsstrategie, wenn sich die Basislinienstatistik durch das direkte Deaktivieren ausgewählter Satelliten oder GPS-Beobachtungsdaten nicht verbessert. Das Heraufsetzen der Höhenmaske kann rauschende Daten entfernen und die Basislinienstatistik verbessern. Sie müssen evtl. verschiedene Einstellungen ausprobieren. Versuchen Sie, den Höhenmaskenwinkel zu erhöhen. Erhöhen Sie die Höhenmaske dabei jeweils und ein Grad, um einen Verlust wertvoller Daten zu vermeiden.

So bewerten Sie die Höhe:

1.	Führen Sie einen der folgenden Schritte aus, um Timeline anzuzeigen:

   Wählen Sie Ansicht / Timeline.

   Drücken Sie Alt+AI.

Timeline erscheint.

2.	Klicken Sie auf das [image] -Symbol auf dem gewünschten Datenordner, um einzelne Satelliten anzusehen, die mit der Berechnung der problematischen Basislinie verbunden sind.

3.	Klicken Sie mit der rechten Maustaste auf ein Satelliten-Symbol.

4.	Wählen Sie SV-Plot.

5.	Klicken Sie auf Höhe, um die Höhenänderung für die Satelliten anzusehen.

6.	Wiederholen Sie dies für alle Satelliten, die zur Berechnung der Basislinie beigetragen haben, um festzustellen, ob sich die Resultate durch das Heraufsetzen der Höhenmaske verbessern.

So setzen Sie die Höhenmaske herauf:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile, um das Dialogfeld GPS-Verarbeitungsstile anzuzeigen. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie den Stil aus der Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Geben Sie in das Feld Höhenmaske den neuen Winkel für die Höhenmaske ein.

5.	Klicken Sie ein- oder mehrmals auf OK, bis alle Dialogfelder geschlossen sind.

6.	Klicken Sie auf die Basislinie.

7.	Führen Sie einen der nachfolgenden Schritte aus, um die Basislinie zu verarbeiten:

   Wählen Sie Vermessung / GPS-Basislinien verarbeiten

   Drücken Sie F9.

Die Basislinie wird erneut verarbeitet.

8.	Überprüfen Sie die Ergebnisse.

Prüfen Sie, ob sich durch diese Problemlösungsstrategie die Qualität der Basislinie verbessert hat.


Beobachtete Met-Daten für die GPS-Verarbeitung verwenden

Das Kontrollkästchen ‘Beobachtete Met-Daten verwenden‘ legt fest, ob bei der Troposphären-Korrektur während der Basislinienverarbeitung beobachtete Met-Daten verwendet werden sollen.

HINWEIS: Bei den nachfolgenden Schritten wird davon ausgegangen, daß das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten geöffnet ist.

So aktivieren oder deaktiveren Sie die Verwendung von Met-Daten:

1.	Wählen Sie das Register Tropo. Die Tropo-Einstellungen werden angezeigt.

2.	Aktivieren Sie das Kontrollkästchen Beobachtete Met-Daten verwenden, um den Typ der meteorologischen Daten auszuwählen, der bei der Berechnung von GPS-Verarbeitungslösungen verwendet werden soll. Met (meteorologische)-Daten enthalten die relative Luftfeuchtigkeit, den Luftdruck und die Temperatur. Beachten Sie folgende Richtlinien:

  Wenn dieses Kontrollkästchen gewählt ist, werden die beobachteten meteorologischen Daten in der GPS-Datei (.dat) oder die aus einer RINEX-Datei importierten Daten für die Troposphären-Modellierung bei der Berechnung der Troposphären-Zenitverzögerung benutzt. Dieses Kontrollkästchen ist gemäß Voreinstellung aktiviert.

  Deaktivieren Sie diese Option, wenn Sie Standard-Met-Werte anstelle der beobachteten Met-Daten verwenden möchten.

HINWEIS: Bei der Aufzeichnung von Met-Daten im Feld ist es äußerst wichtig, kalibrierte qualitativ hochwertige Instrumente zu verwenden, um korrekte Beobachtungen zu gewährleisten. Met-Daten, die ohne Kalibrierung oder mit schlechten Geräten erfaßt wurden, können zu einer Verschlechterung der Basislinienlösung führen.


Ephemeriden-Eigenschaften in Timeline ansehen

 Überblick und weitere Informationen

Informationen, die aus Broadcast-Ephemeriden einzelner Satelliten bei Datenerfassungsitzungen aufgezeichnet wurden, stehen in Timeline zur Verfügung. Der entsprechende Datenordner muß geöffnet werden, bevor diese Informationen angesehen werden können.

Die im Dialogfeld enthaltenen Ephemerideninformationen sind aus den Broadcast-Ephemeriden abgeleitet und können nicht bearbeitet werden. Die in den Feldern URA und Zustand angezeigten Meldungen sollten besonders beachtet werden. Diese Felder sind Indikatoren für die Qualität der vom Satelliten übertragenen Daten.

Führen Sie einen der nachfolgenden Schritte aus, um Ephemerideneigenschaften anzusehen:

  Doppelklicken Sie auf das Ephemeriden-Symbol.

  Klicken Sie auf die Schaltfläche [image] in der Timeline Symbolleiste.

Das Dialogfeld Satelliten Ephemeriden-Information erscheint.


Besetzungseigenschaften in Timeline ansehen

 Überblick und weitere Informationen

Die Eigenschaften kontinuierlicher Segmente und statischer Besetzungen können im Dialogfeld Besetzung/Datensegmenteigenschaften angesehen werden. Das Dialogfeld wird automatisch aktualisiert, um den gewählten Besetzungstyp anzuzeigen.

So können Sie die Besetzungseigenschaften ansehen:

1.	Doppelklicken Sie auf das gewünschte Besetzungselement. Das Dialogfeld Besetzung/Datensegmenteigenschaften erscheint.

2.	Klicken Sie auf OK, nachdem Sie die Eigenschaften angesehen haben.

HINWEIS: Sie können ausgewählte Eigenschaften, darunter den Segmenttyp, die Start- und Stoppzeiten der Besetzung und die Antenneneigenschaften ebenfalls bearbeiten.


GPS-Beobachtungseigenschaften in Timeline ansehen

 Überblick und weitere Informationen

Die Satellitenfilter sind gemäß Voreinstellung aktiviert, wenn Timeline erscheint. Sie können die Filter deaktivieren, um GPS-Beobachtungen auszublenden.

So filtern Sie GPS-Beobachtungen mit Hilfe der Symbolleiste:

  Klicken Sie in der Timeline-Symbolleiste auf die Schaltfläche [image].

Die GPS-Beobachtungen werden ausgeblendet, wenn sie zuvor eingeblendet waren, und umgekehrt.

So filtern Sie GPS-Beobachtungen in der Zeitraum-Ansicht:

1.	Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht.

2.	Wählen Sie Ansicht Filter / Satelliten.

Die GPS-Beobachtungen werden ausgeblendet, wenn sie zuvor eingeblendet waren, und umgekehrt.


Das nächste oder das vorhergehende Besetzungssegment in Timeline ansehen

 Überblick und weitere Informationen

Die Befehle Nächste und Vorhergehend (auch als blaue Pfeile in der Timeline-Symbolleiste enthalten) werden zur Verschiebung der Zeitraum-Ansicht zum nächsten oder vorhergehenden Start- oder Endpunkt einer Besetzung verwendet. Diese Befehle sind besonders nützlich, wenn die Timeline sehr lang ist und es schwierig ist, die Ansicht zwischen den einzelnen Besetzungen zu verschieben.

So verwenden Sie die Befehle Nächste und Vorhergehend:

1.	Wählen Sie das Besetzungselement in der Zeitraum-Ansicht.

2.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Nächste oder Vorhergehend zu verwenden:

  Klicken Sie mit der rechten Maustaste auf die Besetzung, und wählen Sie Nächste oder Vorhergehend.

  Klicken Sie in der Timeline-Symbolleiste auf [image] oder [image].

Mit Nächste wird die Zeitraum-Ansicht zum Endpunkt der nächsten Besetzung verschoben. Mit Vorhergehend wird die Zeitraum-Ansicht zur vorherigen Besetzung verschoben.

HINWEIS: Das Dialogfeld Besetzung/Datensegmenteigenschaften enthält zwei Pfeilschaltflächen. Der linke Pfeil führt den selben Vorgang aus, wie der Befehl Vorhergehend. Der rechte Pfeil entspricht dem Befehl Nächste. Mit Hilfe dieser Schaltflächen können Sie die Zeitraum-Ansicht zur nächsten oder vorhergehenden Besetzung verschieben und gleichzeitig die Eigenschaften einer jeden Besetzung ansehen.

TIP: Sie können das Eigenschaftsfenster auch zum Verschieben der Zeitraum-Ansicht verwenden, indem Sie eine Beobachtung oder einen Punkt wählen, der mit der Besetzung verbunden ist. Durch die Auswahl einer Besetzung oder einer Beobachtung im Eigenschaftsfenster wird automatisch das entsprechende Vermessungselement gewählt, und die Zeitraum-Ansicht wird automatisch zum verknüpften Besetzungselement verschoben. Wenn Sie das Eigenschaftsfenster geöffnet lassen, während Sie in Timeline arbeiten, können Sie die Eigenschaften der Beobachtungen und Punkte ansehen, die mit den Besetzungen verbunden sind.


Statistiken für Basislinien ansehen

 Überblick und weitere Informationen

Statistiken für Basislinien können auf unterschiedliche Arten angesehen werden. Sie können während und nach einer GPS-Verarbeitungssitzung angezeigt werden.

So können Sie die Statistiken für Basislinien im Dialogfeld GPS-Verarbeitung ansehen:

1.	Beginnen Sie mit der GPS-Verarbeitung.

Das Dialogfeld GPS-Verarbeitung erscheint, und die Verarbeitungssitzung beginnt. Bei der Verarbeitung wird jede Basislinienlösung in der GPS-Verarbeitungsliste angezeigt. Weitere Informationen finden Sie unter Basislinien verarbeiten.

2.	Überprüfen Sie die Spalten Verhältnis, Ref.var und RMS für jede Basislinie.

Diese Spalten enthalten die Resultate der Verhältnis-, Referenzvarianz- und RMS-Tests. Wenn das im Bericht angezeigte Ergebnis die im GPS-Verarbeitungsstil festgelegten Akzeptanzkriterien erfüllt, wird die Basislinienlösung akzeptiert und ein Häkchen erscheint in der ersten Spalte der Liste. Wird in dieser Spalte kein Häkchen angezeigt, hat einer der aktivierten Qualitätsprüfungstests schlechte Ergebnisse erbracht.

HINWEIS: Gekennzeichnete Basislinien werden ebenfalls im Projekt gespeichert, aber es wird eine rote Warnkennzeichnung (kleine rote Flagge) im Graphikfenster angezeigt. Die Eigenschaften gekennzeichneter Basislinien sollten überprüft werden, um festzustellen, warum die Basislinie die Akzeptanzkriterien nicht erfüllt und geeignete Schritte unternommen werden können, um mögliche Unstimmigkeiten zu beheben. Weitere Informationen finden Sie unter Eigenschaftsfenster.

3.	Wenn Sie den GPS-Basislinienverarbeitungsbericht für eine bestimmte Lösung ansehen möchten, wählen Sie die Lösung aus der Liste, und klicken Sie auf Bericht. Der GPS-Basislinienverarbeitungsbericht erscheint.

TIP: Sie können ebenfalls auf die Basislinie doppelklicken, um den Bericht anzusehen. Sie müssen nicht warten, bis die GPS-Verarbeitungssitzung beendet ist, um sich den Bericht anzusehen. Die Verarbeitung wird fortgeführt, während Sie sich die Berichte für individuelle Basislinien ansehen.


Den GPS-Basislinienverarbeitungsbericht ansehen

 Überblick und weitere Informationen

Der GPS-Basislinienverarbeitungsbericht für eine Basislinie kann angesehen werden, sobald eine Basislinie verarbeitet wurde und die Resultate in der GPS-Verarbeitungsliste angezeigt werden. Das Verarbeitungsprogramm fährt mit der Basislinienverarbeitung fort, während Sie GPS-Basislinienverarbeitungsbericht ansehen.

So können Sie den GPS-Basislinienverarbeitungsbericht ansehen:

1.	Führen Sie einen der nachfolgenden Schritte aus, um der GPS-Basislinienverarbeitungsbericht anzuzeigen:

  Doppelklicken Sie auf eine Basislinienlösung im Dialogfeld GPS-Verarbeitung.

  Wählen Sie eine Basislinie, und klicken Sie auf Bericht.

Der GPS-Basislinienverarbeitungsbericht erscheint.

2.	Rollen Sie durch den Bericht, um die Daten zu prüfen.

Prüfen Sie die Details der Basislinienlösung, die nicht in der einzeiligen Zusammenfassung enthalten sind.

Vergleichen Sie die Standpunktinformationen in der Lösung mit ihren Feldnotizen. Achten Sie dabei vor allem auf:

  Standpunktnamen

  Antennenhöhen, -typen und -Meßmethoden

  Anfangs- und Endzeiten

Prüfen Sie die Zusammenfassungen der Satellitenverfolgung für jeden Standpunkt auf Unterbrechungen oder Lücken im L1- und L2-Signal. Eine durchgehende Linie kennzeichnet ein klares Signal. Eine Unterbrechung oder eine Lücke in dieser Linie weist auf einen Phasensprung oder den Verlust des Satellitensignals hin. Markierungen (kleine Striche) geben an, wann der Empfänger die Verfolgung des Satellitensignals nach einem Phasensprung wieder aufgenommen hat.

Prüfen Sie die kombinierte Zusammenfassung der Satellitenphasenverfolgung. Die grau unterlegten Messungen wurden bei der Berechnung der Basislinienlösung verwendet.

Prüfen Sie die Restwerte-Plots für jeden Satelliten. Sie enthalten den RMS der einzelnen Satelliten, die zur Berechnung der Basislinienlösung beigetragen haben.


    Befehl GPS-Basislinien verarbeiten

Weitere Informationen

Wie kann ich ...	Dialogfeld
Wählen Sie diesen Befehl, um eine GPS-Verarbeitungssitzung zu starten:

  Wählen Sie Vermessung / GPS-Basislinien verarbeiten. Das Dialogfeld GPS-Verarbeitung erscheint, und die GPS-Verarbeitungssitzung beginnt.


    Befehl Bericht GPS-Basislinienverarbeitung

Weitere Informationen

Wie kann ich ...	Siehe auch
Wählen Sie diesen Befehl, um den GPS-Basislinienverarbeitungsbericht anzusehen.

1.	Wählen Sie die Basislinie(n), für die ein Bericht erstellt werden soll.

2.	Wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung. Der GPS-Basislinienverarbeitungsbericht wird angezeigt.

Dieser Bericht enthält die Resultate der vorherigen GPS-Verarbeitungssitzung. Verwenden Sie ihn, um die Resultate der GPS-Basislinienlösungen zu analysieren.

HINWEIS: Der GPS-Basislinienverarbeitungsbericht ist auch über das Dialogfeld GPS-Verarbeitung zugänglich. Sie können individuelle Basislinienlösungen aus der GPS-Verarbeitungsliste wählen und dann auf Bericht klicken, um den Basislinienverarbeitungsbericht anzusehen.


    Befehl Timeline

Weitere Informationen

 Siehe auch

Führen Sie in der Vermessungsansicht einen der folgenden Schritte aus, um den Timeline-Ansichtsbereich zu öffnen:

  Wählen Sie Ansicht / Timeline.

  Wählen Sie in der Symbolleiste [image].

Der Timeline-Ansichtsbereich erscheint im unteren Teil des Graphikfensters.

Timeline zeigt Informationen über GPS-Messungen in einem Projekt in einem graphischen Zeitformat an. Alle Daten werden an den entsprechenden Positionen auf einer Zeitlinie dargestellt. Timeline kann nur in der Vermessungsansicht aufgerufen werden.


Dialogfeld Stil bearbeiten - Überblick
    Dialogfeld Stil bearbeiten − Überblick

Weitere Informationen

 Wie kann ich ...

Überblick

Verwenden Sie dieses Dialogfeld, um festzulegen, wie GPS-Daten verarbeitet werden sollen.

So öffnen Sie das Dialogfeld Stil bearbeiten:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile.  Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint. Der gewählte Stil wird in der Titelleiste des Dialogfelds angezeigt.

Klicken Sie auf Fortgeschritten, wenn Sie Zugang zu erweiterten Stilsteuerungen für die Feinabstimmung der GPS-Basislinienverarbeitung erhalten möchten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

Höhenmaske

Bearbeiten Sie dieses Feld, um die minimale Satellitenhöhe für die GPS-Basislinienverarbeitung festzulegen. Diese Einstellung überschreibt die zur Datenerfassung im Feld verwendete Höhenmaske.

Beachten Sie folgende Richtlinien:

  Die Trimble Geomatics Office Software verwendet zur Berechnung von Basislinienverarbeitungsresultaten nur Satelliten, die sich oberhalb der eingegebenen Höhe befinden. Der Wert muß in Grad eingeben werden. Die Voreinstellung beträgt 13 Grad.

  Sie können einen Wert einstellen, der über oder unter der im Feld zur Datenerfassung verwendeten Höhenmaske liegt. In diesem Feld wird normalerweise ein höherer Wert eingestellt. Wenn Sie einen niedrigeren Wert einstellen, wirkt sich dies nicht auf die Basislinienverarbeitung aus.

  Diese Einstellung ist besonders nützlich, wenn mehrere Empfänger und unterschiedliche Höhenmasken bei der Datenerfassung verwendet wurden. Das Feld überschreibt die unterschiedlichen Höhenmasken-Einstellungen und benutzt eine konstante Höhenmaske bei der Basislinienverarbeitung.

  Wird der Wert für die Höhenmaske erhöht, werden Satelliten mit geringer Höhe nicht in die GPS-Verarbeitung einbezogen. Die Signale dieser Satelliten können durch Datenrauschen beeinträchtigt werden, das durch mögliche Hindernisse und lange Wege durch die Troposphäre entstehen kann.

  Wenn die Höhenmaske auf einen zu hohen Wert eingestellt wird, könnte die Anzahl der verfügbaren Satelliten in der Konstellation für die Verarbeitung zu gering sein.

Ephemeriden

Wählen Sie den Ephemeridentyp, der bei der Basislinienverarbeitung verwendet  werden soll, aus dieser Liste:

  Broadcast − dies ist die Voreinstellung für die meisten Verarbeitungen. Die Broadcast-Ephemeriden werden periodisch von jedem GPS-Satelliten übertragen, in der Regel jede Stunde. Die Ephemeriden enthalten die Umlaufbahnparameter des Satelliten.

  Genau − wählen Sie diese Option, um die Genauigkeit der Basislinie zu verbessern. In vielen Fällen wird die Lösung von Mehrdeutigkeiten für sehr lange Basislinien durch die Verwendung genauer Ephemeriden erleichtert. Bevor diese Option gewählt werden kann, müssen eine oder mehrere genaue Ephemeriden in das Projekt importiert werden.

Um genaue Ephemeriden für die Basislinienverarbeitung zu verwenden, müssen die in das Projekt importierten genauen Ephemeriden-Dateien mindestens acht Sätze mit SV-Positionen vor und nach dem Zeitintervall für die Datenverarbeitung enthalten. Da die meisten Dateien mit genauen Ephemeriden SV-Positionen für Zeiträume von 15 Minuten enthalten, müssen zwei Stunden vor und zwei Stunden nach Vermessungsbeginn genaue Ephemeriden aufgezeichnet werden. Wenn Sie um 0:00 UTC vermessen, benötigen Sie evtl. genaue Ephemeriden-Dateien, die zwei Tage zuvor gesendet wurden, um eine korrekte Abdeckung des Zeitraumes zu gewährleisten.

Früher enthielten genaue Ephemeriden-Dateien Informationen über alle GPS-Satelliten für eine ganze Woche. Heutzutage enthalten die meisten Dateien Informationen für einen einzigen Tag. Genaue Ephemeriden-Dateien sind in den Formaten SP3 und EF 18 erhältlich. Die Trimble Geomatics Office Software kann beide Formate nutzen.

Genaue Ephemeriden-Dateien sind bei folgenden Organisationen erhältlich:

  National Geodetic Survey (NGS)

  Center for Orbit Determination in Europe (CODE)

  European Space Agency (ESA)

  Scripps Institute Observatory (SIO)

  Canadian Department of Energy, Mines, and Resources (EMR)

  NASA Jet Propulsion Laboratory (JPL)

  U.S. Naval Observatory (USNO)

Lösungstyp

Wählen Sie aus dieser Liste den Lösungstyp für den letzten Durchgang bei der Basislinienverarbeitung.

Das Basislinienverarbeitungsprogramm durchläuft eine festgelegte Lösungssequenz für jede Basislinie, wobei die verfügbaren Beobachtungen und die Einstellungen des aktiven Verarbeitungsstils zugrundegelegt werden. Die Verarbeitung beginnt in der Regel mit einer Code-Lösung, gefolgt von einer dreifachen Differenz und mehreren doppelt differenzierten Trägerphasenlösungen. Die Lösung für den letzten Durchgang wird in dieses Feld eingegeben. Diese Lösung ist die bestmögliche Lösung für den Steuer- und Beobachtungssatz.

Die häufigsten Lösungstypen sind L1 Fixed für kurze Basislinien und Iono-freie Fixed-Lösungen für die meisten anderen Lösungen. Wenn Sie sehr lange Basislinien verarbeiten, könnten Iono-freie Float-Lösungen die bestmöglichen Lösungen sein.

Folgende Optionen sind verfügbar:

  Code − verwenden Sie diese Option, um ‘Nur Code‘-Lösungen zu erzeugen. Wenn Sie diese Option wählen, wird die GPS-Verarbeitung beim Code-Lösungsdurchgang beendet.

  Float − verwenden Sie diese Option, um eine Float-Lösung zu erzeugen, und nicht nach festen ganzzahligen Mehrdeutigkeiten zu lösen. In einigen Fällen kann die kürzere Berechnungszeit von Vorteil sein. Diese Option kann z. B. nützlich sein, wenn sehr lange Basislinien verarbeitet werden, für die möglicherweise nur eine Float-Lösung in Frage kommt. Wenn der Float-Lösungstyp gewählt wird, führt das GPS-Basislinienverarbeitungsprogramm keine (unter Umständen sehr langwierige) Ganzzahlsuche durch.

Weitere Steuerungen zur Erzeugung alternativer Float-Lösungen beinhalten:

  Maximale Basislinienlänge für Fixed-Lösung

  Maximales Zeitlimit für Ganzzahl-Suche

Diese beiden Steuerungen sind im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten enthalten.

  Fixed − Verwenden Sie diese Option, um ganzzahlige Fixed-Lösungen zu erzeugen. Dies ist die Voreinstellung und auch der bevorzugte Lösungstyp.

HINWEIS: Wenn Sie einen GPS-Verarbeitungsstil erstellen, der als endgültigen Lösungstyp eine ‘Nur Code‘-Lösung enthält, sollten Sie die Akzeptanzkriterien im Register Qualität ebenfalls ändern. ‘Nur Code‘-Lösungen werden normalerweise gekennzeichnet, wobei die Kriterien des voreingestellten Trimble-Verarbeitungsstils zugrundegelegt werden. Ein ‘Nur Code‘-Verarbeitungsstil mit den entsprechenden Akzeptanzkriterien gewährleistet, daß die Verarbeitungsergebnisse für die Basislinien korrekt ausgewertet werden.

Fortgeschritten

Klicken Sie auf Fortgeschritten, um die erweiterten Steuerungen im aktiven GPS-Verarbeitungsstil anzusehen oder zu bearbeiten.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten - Register Statisch
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Statisch

Weitere Informationen

 Wie kann ich ...

Bearbeiten Sie diese Steuerungen, um die Einstellungen für die Verarbeitung von statischen und FastStatic-Basislinien zu ändern.

So greifen Sie auf das Register Statisch im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Statisch.

Minimale Beobachtungszeit für Basislinie

Bearbeiten Sie dieses Feld, um die Zeitüberschneidung zwischen zwei gleichzeitigen Standpunktbesetzungen einzugeben, die für die Basislinienverarbeitung erforderlich ist. Dadurch wird auch festgelegt, welche potentiellen Basislinien zu einem Projekt hinzugefügt werden.

Gemäß Voreinstellung benötigt das Verarbeitungsprogramm Daten, die über einen Zeitraum von 120 Sekunden gleichzeitig beobachtet wurden, um eine Basislinie zwischen zwei Empfängern berechnen zu können. Dadurch wird eine zufällige Überlappung zwischen mehreren Rovern vermieden.

Maximale Basislinienlänge für Fixed-Lösung

Bearbeiten Sie die Felder in dieser Gruppe, um die maximale Länge der Basislinien festzulegen, für die das Verarbeitungsprogramm eine Fixed-Lösung berechnen soll. Für Basislinien, die die eingegebene maximale Länge überschreiten, werden Float-Lösungen berechnet.

Folgende Felder sind verfügbar:

  Broadcast-Ephemeriden verwenden − bearbeiten Sie dieses Feld, um die maximale Basislinienlänge für die Berechnung von Fixed-Lösungen festzulegen, bei denen Broadcast-Ephemeriden verwendet werden. Das GPS-Basislinienverarbeitungsprogramm berechnet keine Fixed-Lösung, wenn die Basislinienlänge den Wert in diesem Feld überschreitet. Die Voreinstellung ist 200 Kilometer.

  Genaue Ephemeriden verwenden − bearbeiten Sie dieses Feld, um die maximale Basislinienlänge für die Berechnung von Fixed-Lösungen festzulegen, bei denen genaue Ephemeriden verwendet werden. Das GPS-Basislinienverarbeitungsprogramm berechnet keine Fixed-Lösung, wenn die Basislinienlänge den Wert in diesem Feld überschreitet. Die Voreinstellung ist 2000 Kilometer.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten – Register Kinematisch
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Kinematisch

Weitere Informationen

Wie kann ich ...	Siehe auch
Bearbeiten Sie diese Steuerungen, um die Einstellungen für die Verarbeitung kinematischer Basislinien zu ändern.

So greifen Sie auf das Register Kinematisch im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Kinematisch.

Minimale Referenzbeobachtungszeit

Bearbeiten Sie dieses Feld, um die Mindestbeobachtungszeit für eine Besetzung festzulegen, die bei der Verarbeitung als kinematische Referenzstation für andere Besetzungen dienen soll.

Beachten Sie folgende Richtlinien:

  Der eingegebene Wert soll sicherstellen, daß das GPS-Verarbeitungsprogramm keine Überlappungen für allgemeine Beobachtungen berechnet, die aus verschiedenen Dateien in das Projekt importiert wurden. Die Beobachtungen werden von zwei oder mehreren Rovern durchgeführt, die gleichzeitig zwei Punkte besetzen. Wenn ein Rover über die erforderliche Mindestzeit hinaus stationär über einem Punkt verbleibt, wird er als Referenzpunkt angesehen. Die allgemeinen Beobachtungsdaten, die von den anderen Empfängern erfaßt werden, werden relativ zu diesem Referenzpunkt verarbeitet.

  Eine kinematische Vermessung mit einem einzigen Basis-Empfänger und zwei Rovern ist ein gutes Beispiel. Ohne die minimale Referenzbeobachtungszeit versucht das GPS-Basislinienverarbeitungsprogramm nicht nur die Daten zwischen den Rovern und der Basis, sondern auch die Daten zwischen den beiden Rovern zu berechnen.

  Die Voreinstellung beträgt 600 Sekunden. Die voreingestellte minimale Referenzbeobachtungszeit schreibt dem GPS-Verarbeitungsprogramm vor, daß nur Besetzungen, die länger als 600 Sekunden (oder 10 Minuten) dauern, als Referenzpunkte verwendet werden dürfen.

  Stellen Sie in diesem Feld einen Wert von Null ein, um die Basislinien zwischen den Rovern zu berechnen.

Minimale Beobachtungszeit für statische Initialisierung

Bearbeiten Sie dieses Feld, um die Mindestbeobachtungszeit für eine Basislinie zu ändern, die zur statischen Initialisierung für ein bestimmtes kinematisches Verarbeitungssegment verwendet werden soll.

Beachten Sie folgende Richtlinien:

  Gemäß Voreinstellung muß eine Basislinie mindestens 120 Sekunden (oder 2 Minuten) besetzt werden, bevor sie zur Initialisierung verwendet werden kann.

  Basislinien, die diesen Wert überschreiten, werden als statische Basislinien berechnet und zur statischen Initialisierung im Projekt gespeichert.

Minimales Initialisierungsverhältnis für bekannten Punkt

Bearbeiten Sie dieses Feld, um das akzeptable Mindestverhältnis für die Initialisierung über einem bekannten Punkt bei der Verarbeitung kinematischer GPS-Daten zu ändern.

Eine Initialisierung über einem bekannten Punkt beginnt mit der Ableitung von Richtungswinkel/Strecke zwischen zwei bekannten Punkten. Die aus diesem Richtungswinkel/Strecke abgeleiteten Informationen werden wie eine Fixed-Basislinie behandelt. Das Basislinienverarbeitungsprogramm hält dann die Basislinie, aus der Richtungswinkel und Strecke abgeleitet wurden, an und löst nur die Satelliten-Unbekannten auf. Dieser Schritt beinhaltet eine Ganzzahl-Suche, die mit der Ganzzahl-Suche bei der Berechnung von statischen oder FastStatic-Lösungen vergleichbar ist.

Der Verhältniswert, der zur Beurteilung der Ganzzahl-Suche verwendet wird, ist derselbe wie bei einer normalen Ganzzahl-Suche. Ist der Verhältniswert größer, als der minimale Wert für bekannte Punkte, wird das Ergebnis vom Programm akzeptiert und zur Initialisierung für die nachfolgenden kinematischen Berechnungen verwendet.

Das voreingestellte Verhältnis für eine Initialisierung über einem bekannten Punkt ist 3,0. Dieser Wert liegt über dem normalen Grenzwert von 1,5 für statische und FastStatic-Lösungen. Der Grund dafür ist, daß das Verarbeitungsprogramm nur Satelliten-Mehrdeutigkeiten löst. Da weniger Variablen vorhanden sind, wird ein höheres Verhältnis angenommen.

Minimale OTF-Berechnungszeit

Bearbeiten Sie dieses Feld, um die erforderliche Mindestzeit zur Auflösung ganzzahliger Mehrdeutigkeiten On-The-Fly (OTF) zu ändern.

Beachten Sie folgende Richtlinien:

  Der Empfänger muß über einen Zeitraum von 200 Sekunden kontinuierlich Daten erfassen und mindestens vier Satelliten verfolgen, um die OTF-Initialisierung zu berechnen. Die Voreinstellung beträgt 200 Sekunden; der Empfänger muß während dieses Zeitraums mindestens 5 Satelliten verfolgen.

  Falls keine Daten für die statische Initialisierung zur Verfügung stehen, versucht das GPS-Verarbeitungsprogramm, die ganzzahligen Mehrdeutigkeiten zu lösen. Es verwendet dabei alle Daten, bei denen mindestens vier Satelliten in der Konstellation über Epochen von je 200 Sekunden verfolgt werden konnten. Da sich die Satellitenkonstellation ständig ändert, werden nur die Daten verarbeitet, die von einer bestmöglichen Kombination von vier Satelliten erhalten wurden. Es müssen jedoch nicht dieselben vier Satelliten für die gesamte Besetzungsdauer sein.

  Falls eine Initialisierung für statische und Fixed-Basislinien durchgeführt wurde und noch Mehrdeutigkeiten vorhanden sind, benutzt das GPS-Pogramm die OTF-Initialisierungsmethode. Dabei wird die OTF-Initialisierung nur auf kinematische Verarbeitungssegmente angewendet, die das Zeitintervall nicht überschreiten. Alle anderen Segmente müssen mit statischen oder Fixed-Basislinienmethoden initialisiert werden.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten – Register Qualität
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Qualität

Weitere Informationen

Wie kann ich ...	Siehe auch
Bearbeiten Sie diese Steuerungen, um festzulegen, ob Daten und Lösungen, die außerhalb der Toleranzwerte liegen, gekennzeichnet oder zurückgewiesen werden sollen, bevor die Verarbeitungsresultate im Projekt gespeichert werden. Die in diesem Register enthaltenen Steuerungen bestimmen, welche Basislinienlösungen akzeptiert, gekennzeichnet oder zurückgewiesen werden.

So greifen Sie auf das Register Qualität im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Qualität.

Akzeptanzkriterien

Bearbeiten Sie die Felder in dieser Gruppe, um die Akzeptanzkriterien für den Akzeptanz-, Kennzeichnungs- oder Zurückweisungs-Status bei der Berechnung von Basislinienlösungen zu ändern. Diese Kriterien werden auch zur Bestimmung von Basislinienlösungen verwendet, die (gemäß Voreinstellung) nach der Berechnung im Projekt gespeichert werden sollen.

Beachten Sie folgende Richtlinien:

 Die Felder Kennz. und Zurückw. stehen für die Parameter RMS, Verhältnis und Referenzvarianz  zur Verfügung. Die durchgeführten Tests werden in einem der folgenden Themen beschrieben:

  Kontrollkästchen Wenn RMS

  Kontrollkästchen Wenn Verhältnis

  Kontrollkästchen Wenn Referenzvarianz

  Es können getrennte Kriterien für Ein- und Zweifrequenzlösungen festgelegt werden. Die Verwendung der Akzeptanzkriterien für Ein- und Zweifrequenzlösungen wird durch die Kombination der verfügbaren GPS-Messungen, den im aktiven GPS-Verarbeitungsstil gewählten Lösungstyp und durch die vom Basislinienverarbeitungsprogramm berechnete endgültige Lösung bestimmt.

  Sie können eine beliebige Kombination der RMS-, Verhältnis-, und Referenzvarianz-Kontrollkästchen für die Akzeptanzprüfung wählen. Gemäß Voreinstellung sind alle drei Qualitätsparameter zur Akzeptanz/Kennzeichnung/Zurückweisung aktiviert. Wenn mehr als ein Qualitätsprüfungsfaktor verwendet wird, wird der Status auf der Grundlage der schlechtesten Bedingungen erstellt. So wird z. B. eine Basislinienlösung zurückgewiesen, wenn der Verhältniswert und der Referenzvarianzwert akzeptiert wurden, der RMS-Wert aber außerhalb der Toleranz liegt. Gemäß Voreinstellung werden alle drei Parameter zur Qualitätsprüfung verwendet.

HINWEIS: Bei den meisten Vermessungsanwendungen ist es nicht erforderlich, die Akzeptanzkriterien zu ändern. Eine Ausnahme bildet die ‘Nur Code‘-Lösung im letzten Durchgang. ‘Nur Code‘-Lösungen werden nach den im voreingestellten Trimble-Verarbeitungsstil festgelegten Kriterien gekennzeichnet. Es ist empfehlenswert, einen ‘Nur Code‘-Verarbeitungsstil mit den gewünschten Kriterien zu erstellen, wenn häufig ‘Nur Code‘-Lösungen im letzten Durchgang verarbeitet werden.

Multiplikator bearbeiten

Bearbeiten Sie dieses Feld, um den Multiplikator zu ändern, mit dem der Grenzwert für Ausreißer festgelegt wird, die aus den nachfolgenden Programmiterationen entfernt werden sollen.

Das Basislinienverarbeitungsprogramm berechnet Basislinienlösungen in einer Reihe aufeinanderfolgender Iterationen. Bei jeder Iteration werden Ausreißer gekennzeichnet und aus der Lösung entfernt. Dies geschieht, indem von Epoche zu Epoche ein Beobachtungsrestwert für eine Lösung berechnet wird. Jeder Beobachtungsrestwert wird dann mit einem Grenzwert verglichen, um festzustellen, ob es sich bei dieser Beobachtung um einen Ausreißer handelt.

Der Grenzwert ist der RMS aller Beobachtungsrestwerte, der mit dem unter ‘Multiplikator bearbeiten‘ festgelegten Wert multipliziert wird. Entdeckte Ausreißer werden gekennzeichnet und aus der nächsten Verarbeitungsiteration entfernt. Für jede Iteration wird ein neuer allgemeiner RMS für alle Beobachtungsrestwerte berechnet. Dieser neue Wert dient als Grundlage für den Grenzwert zur Kennzeichnung und Entfernung nachfolgender Beobachtungen.


    Kontrollkästchen Wenn RMS

Weitere Informationen

 Dialogfeld

Dieses Kontrollkästchen steuert die RMS-Toleranz bei der Akzeptanzprüfung von Basislinienlösungen.

RMS ist ein Wert für das in den Messungen enthaltene Datenrauschen. Je geringer der RMS, desto besser. RMS-Werte, die unter dem Kennzeichnungswert liegen, werden akzeptiert. Werte die über dem Kennzeichnungswert aber noch innerhalb der Zurückweisungstoleranz liegen, werden markiert (gekennzeichnet). Überschreiten die Werte die Zurückweisungsgrenze, wird die Lösung verworfen. Wenn das Kontrollkästchen deaktiviert ist, wird der RMS bei der Akzeptanzprüfung nicht berücksichtigt.

Es stehen vier Felder für die RMS-Akzeptanzprüfung zur Verfügung, je zwei Felder (Kennz. und Zurückw.) für Ein- bzw. Zweifrequenzlösungen. Bei der Durchführung des RMS-Akzeptanztests verwendet das GPS-Basislinienverarbeitungsprogramm nur jeweils einen dieser Feldersätze. Die entsprechenden Felder werden vom Lösungstyp bestimmt, der für den GPS-Verarbeitungsstil ausgewählt wurde.

Sie können eine beliebige Kombination der RMS-, Verhältnis-, und Referenzvarianz-Kontrollkästchen für die Akzeptanzprüfung wählen. Gemäß Voreinstellung sind alle Parameter-Kontrollkästchen zur Akzeptanz/Kennzeichnung/Zurückweisung aktiviert. Wenn mehr als ein Qualitätsprüfungsfaktor verwendet wird, wird der Status auf der Grundlage der schlechtesten Bedingungen erstellt. So wird z. B. eine Basislinienlösung zurückgewiesen, wenn der Verhältniswert und der Referenzvarianzwert akzeptiert wurden, der RMS-Wert aber außerhalb der Toleranz liegt.


    Kontrollkästchen Wenn Referenzvarianz

Weitere Informationen

Dialogfeld	Siehe auch
Dieses Kontrollkästchen steuert die Verwendung der Referenzvarianz bei der Akzeptanzprüfung von Basislinienlösungen.

Die Referenzvarianz gibt die Qualität der Fehlerschätzung bei der Basislinienverarbeitung an. Idealerweise sollte die Referenzvarianz bei 1,0 liegen. Werte, die darunter liegen, weisen darauf hin, daß die Fehler geringer ausgefallen sind, als erwartet. Werte über 1,0 geben an, daß die Fehler unterschätzt wurden. Wenn die Akzeptanzprüfung nur für die Referenzvarianz durchgeführt wird, sucht das Programm nur nach Werten, die über der ursprünglichen Fehlerschätzung liegen.

Referenzvarianzwerte, die unter dem Kennzeichnungswert liegen, werden akzeptiert. Werte die über dem Kennzeichnungswert aber noch innerhalb der Zurückweisungstoleranz liegen, werden markiert (gekennzeichnet). Überschreiten die Werte die Zurückweisungsgrenze, wird die Lösung verworfen. Wenn das Kontrollkästchen deaktiviert ist, wird die Referenzvarianz bei der Akzeptanzprüfung nicht berücksichtigt.

Es stehen vier Felder für die Referanzvarianzprüfung zur Verfügung – je zwei Felder (Kennz. und Zurückw.) für Ein- bzw. Zweifrequenzlösungen. Bei der Durchführung des Referenzvarianztests verwendet das GPS-Basislinienverarbeitungsprogramm nur jeweils einen dieser Feldersätze. Die entsprechenden Felder werden vom Lösungstyp bestimmt, der für den GPS-Verarbeitungsstil ausgewählt wurde.

Sie können eine beliebige Kombination der RMS-, Verhältnis-, und Referenzvarianz-Kontrollkästchen für die Akzeptanzprüfung wählen. Gemäß Voreinstellung sind alle Parameter-Kontrollkästchen zur Akzeptanz/Kennzeichnung/Zurückweisung aktiviert. Wenn mehr als ein Qualitätsprüfungsfaktor verwendet wird, wird der Status auf der Grundlage der schlechtesten Bedingungen erstellt. So wird z. B. eine Basislinienlösung zurückgewiesen, wenn der Verhältniswert und Referenzvarianzwert akzeptiert wurden, der RMS-Wert aber außerhalb der Toleranz liegt.


    Kontrollkästchen Wenn Verhältnis

Weitere Informationen

Dialogfeld	Siehe auch
Dieses Kontrollkästchen steuert die Verwendung des Verhältnisses bei der Akzeptanzprüfung von Basislinienlösungen.

Das Verhältnis gibt an, wie gut das Verarbeitungsprogramm Fixed-Lösungen berechnen kann. Je höher der Wert, desto besser. Verhältniswerte, die über dem Kennzeichnungswert liegen, werden akzeptiert. Werte, die unter dem Kennzeichnungswert aber noch innerhalb der Zurückweisungstoleranz liegen, erhalten einen Kennzeichnungsstatus. Werte, die unterhalb der Zurückweisungstoleranz liegen, werden verworfen. Wenn das Kontrollkästchen deaktiviert ist, wird das Verhältnis bei der Akzeptanzprüfung nicht berücksichtigt. Das Verhältnis wird auch ignoriert, wenn die endgültige Lösung für den Verarbeitungsstil eine Float- oder Code-Lösung ist.

Es stehen vier Felder für den Verhältnistest zur Verfügung, je zwei Felder (Kennz. und Zurückw.) für Ein- bzw. Zweifrequenzlösungen. Bei der Durchführung des Verhältnistests verwendet das GPS-Basislinienverarbeitungsprogramm nur jeweils einen dieser Feldersätze. Die entsprechenden Felder werden vom Lösungstyp bestimmt, der für den GPS-Verarbeitungsstil ausgewählt wurde.

Sie können eine beliebige Kombination der RMS-, Verhältnis-, und Referenzvarianz -Kontrollkästchen für die Akzeptanzprüfung wählen. Gemäß Voreinstellung sind alle Parameter-Kontrollkästchen zur Bestimmung der Akzeptanz/Kennzeichnung/Zurückweisung aktiviert. Wenn mehr als ein Qualitätsprüfungsfaktor verwendet wird, wird der Status auf der Grundlage der schlechtesten Bedingungen erstellt. So wird z. B. die Basislinienlösung zurückgewiesen, wenn der Verhältniswert und Referenzvarianzwert akzeptiert wurden, der RMS-Wert aber außerhalb der Toleranz liegt.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten – Register Tropo
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Tropo

Weitere Informationen

Wie kann ich ...	Siehe auch
Bearbeiten Sie diese Steuerungen, um die Auswahl und die Anwendung des Troposphären-Modells bei der Basislinienverarbeitung zu ändern.

So greifen Sie auf das Register Tropo im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Tropo.

Modell

Wählen Sie ein Troposphären-Korrekturmodell aus der Liste. Das Modell kompensiert Fehler, die auftreten, während das Signal die Troposphäre durchquert. Das Ausmaß der Korrektur hängt davon ab, in welcher Höhe sich die Satelliten befinden.

Folgende Optionen sind verfügbar:

  Hopfield − das Hopfield-Modell ist die voreingestellte Option.

  Goad-Goodman

  Saastamoinen

  Black − das Black-Modell ist bei tiefstehenden Satelliten instabil und sollte nicht verwendet werden, wenn die Höhenmaske auf einen Wert unterhalb von 10 Grad eingestellt ist

  Niell − das Niell-Modells ist, außer von der Satellitenhöhe, auch vom Breitengrad und der Jahreszeit abhängig

  Keine − wählen Sie die Option Keine, wenn Sie kein Troposphären-Modell verwenden möchten.

Weitere Informationen über Troposphären-Korrekturmodelle für GPS-Signale finden Sie in der Bibliographie.

Geschätztes Zenit-Verzögerungsintervall

Bearbeiten Sie dieses Feld, um ein konstantes Zeitschätzungsintervall (in Stunden) für die Zenit-Verzögerung anzugeben.

Beachten Sie folgende Richtlinien:

  Die Stunden müssen als ganzzahliger Wert angegeben werden. Das empfohlene Mindestschätzungsintervall beträgt eine Stunde. Die Voreinstellung beträgt 2 Stunden. Wenn ein Wert von Null (0) eingegeben wird, wird keine Zenit-Verzögerungsschätzung durchgeführt. Dieses Feld steht nicht zur Verfügung, wenn das Troposphären-Modell auf ‘Keine‘ eingestellt ist.

  Da die Troposphäre nicht so dynamisch ist, wie die Ionosphäre, ist eine Signalverzögerung von über zwei Stunden schon recht hoch. Wenn Sie lange Basislinien messen und sich nur über einem Empfänger eine Schlechtwetterfront (Sturmtief) befindet, sollten Sie das Intervall verkürzen. Das voreingestellte Intervall ist 2 Stunden.

  Bei Basislinien die länger als 50 Kilometer sind, können Fehler in den Broadcast-Ephemeriden zu einer ungenauen Schätzung der Troposphärenparameter führen. Verwenden Sie in diesem Fall genaue Ephemeriden.

  Für Basislinien unter 10 km Länge mit Datendateien mit einer Meßzeit von unter 2 Stunden, ist eine Zenit-Verzögerungsschätzung nicht unbedingt von Vorteil. Troposphären-Effekte sind von größerer Bedeutung, wenn längere Basislinien über einen längeren Zeitraum beobachtet werden.

Beobachtete Met-Daten verwenden

Wählen Sie dieses Kontrollkästchen, um die Verwendung der im Feld beobachteten Met-Daten für die GPS-Verarbeitungslösungen festzulegen. Met- (meteorologische) Daten enthalten die Lufttemperatur, den Luftdruck und die relative Luftfeuchtigkeit.

Beachten Sie folgende Richtlinien:

  Wenn dieses Kontrollkästchen gewählt ist, werden die beobachteten meteorologischen Daten in der GPS-Datei (.dat), oder die aus einer RINEX-Datei importierten Daten für die Troposphären-Modellierung bei der Berechnung des Zenit-Verzögerungsintervalls benutzt. Dieses Kontrollkästchen ist gemäß Voreinstellung aktiviert.

  Deaktivieren Sie diese Option, wenn Sie Standard-Met-Werte anstelle der beobachteten Met-Daten verwenden möchten.

HINWEIS: Bei der Aufzeichnung von Met-Daten im Feld ist es äußerst wichtig, kalibrierte qualitativ hochwertige Instrumente zu verwenden, um korrekte Beobachtungen zu gewährleisten. Met-Daten, die ohne Kalibrierung oder mit schlechten Geräten erfaßt wurden, können zu einer Verschlechterung der Basislinienlösung führen.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten – Register Iono
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Iono

Weitere Informationen

Wie kann ich ...	Siehe auch
Bearbeiten Sie diese Steuerungen, um die Anwendung des Ionosphären-Modells während der Basislinienverarbeitung zu ändern.

So greifen Sie auf das Register Iono im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Iono.

Durchgang zur Auflösung von Mehrdeutigkeiten

Verwenden Sie das Kontrollkästchen in dieser Gruppe, um das Ionosphären-Modell für den Durchgang zur Auflösung der Mehrdeutigkeiten zu aktivieren. Der Wert, der in das Feld ‘Gilt für alle Basislinien länger als’ eingegeben wird, bestimmt die Mindestlänge der Basislinien, auf die Ionosphären-Korrekturen angewendet werden.

Die voreingestellte Korrekturmethode für Basislinien mit einer Länge von über 10 km, die mit Zweifrequenz-Empfängern aufgezeichnet wurden, ist ‘Iono-frei’. Das Broadcast-Ionosphären-Modell wird für Basislinien verwendet, die mit Einfrequenz-Empfängern beobachtet wurden. Diese Option legt nur die Ionosphären-Korrekturen bei der Lösung der Mehrdeutigkeiten fest. Eine separate Steuerung steht für den letzten Durchgang zur Verfügung.

Letzter Durchgang

Verwenden Sie dieses Kontrollkästchen, um die Ionosphären-Modellierung für den letzten Durchgang festzulegen. Der in das Feld ‘Gilt für alle Basislinien länger als’ eingegebene Wert legt die Mindestlänge der Basislinien fest, auf die Ionosphären-Korrekturen angewendet werden.

Die voreingestellte Korrekturmethode für Basislinien mit einer Länge von über 5 km, die mit Einfrequenz-Empfängern aufgezeichnet wurden, ist ‘Iono-frei’. Diese Option steuert nur die Ionosphären-Korrekturen für den letzten Durchgang. Eine separate Steuerung steht für die Ionosphärenkorrektur des Durchgangs zur Auflösung von Mehrdeutigkeiten zur Verfügung.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten - Register Ereignisse
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Ereignisse

Weitere Informationen

Wie kann ich ...	Siehe auch
Bearbeiten Sie diese Steuerungen, um das Interpolationsschema und das Zeit-Offset festzulegen, das für die Berechnung von Ereignispositionen und -zeiten verwendet werden soll.

So greifen Sie auf das Register Ereignisse im Dialogfeld Erweitere Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Ereignisse.

Wenn ein Empfänger ein Ereignis aufzeichnet, wird eine Ereignismarkierung in der GPS-Messungsdatei gespeichert. Diese Ereignismarkierung enthält eine Zeitkennzeichnung, die angibt, wann das Ereignis aufgetreten ist. Da Ereignisse nur selten genau zu dem Zeitpunkt auftreten, an dem auch die Messung durchgeführt wird, muß das GPS-Basislinienverarbeitungsprogramm die Empfängerpositionen vor und nach dem Ereignis berechnen und daraus die Position, an der das Ereignis aufgetreten ist, interpolieren.

Interpolationsmethode

Wählen Sie eine dieser Optionen, um die lineare oder quadratische Interpolation zur Ableitung von Ereignispositionen bei der Verarbeitung kontinuierlicher kinematischer Daten zu wählen.

  Linear − wählen Sie diese Option, um eine einfache lineare Interpolation durchzuführen und Positionen zu verwenden, die aus Basislinienlösungen abgeleitet werden, die vor und nach dem aufgezeichneten Ereigniszeitpunkt berechnet wurden. Mindestens zwei Punkte sind erforderlich, und maximal fünf Punkte können für die lineare Interpolation verwendet werden. Geben Sie die Anzahl der Punkte in das Feld Anzahl einzufügender Punkte ein. Die Voreinstellung ist 2 Punkte.

  Quadratisch − wählen Sie diese Option, um eine Kurvenanpassung zweiter Ordnung durchzuführen und Positionen zu verwenden, die aus Basislinienlösungen abgeleitet werden, die vor und nach dem aufgezeichneten Ereigniszeitpunkt berechnet wurden. Mindestens drei Punkte sind erforderlich, und maximal fünf Punkte können für die quadratische Interpolation verwendet werden. Geben Sie die Anzahl der Punkte in das Feld ‘Anzahl einzufügender Punkte‘ ein. Die Voreinstellung ist 3 Punkte.

Die Interpolation und die endgültige Zeitkennzeichnung werden durch folgende Optionen gesteuert:

Anzahl einzufügender Punkte

Bearbeiten Sie dieses Feld, um die Anzahl der Punkte festzulegen, die zur Interpolation einer Ereignisposition verwendet werden sollen.

Der Wert kann benutzt werden, um die Anzahl der Punkte für die lineare und die quadratische Interpolationsmethode festzulegen. Die Voreinstellung für die lineare Interpolation beträgt 2 Punkte. Die Quadratische Interpolation ist auf 3 Punkte voreingestellt. Wenn die Anzahl der Punkte nicht ausreichend ist, wird keine Interpolation durchgeführt.

Maximal zulässige fehlende Epochen

Bearbeiten Sie dieses Feld, um die maximale Anzahl fehlender Meßepochen für die Berechnung von Ereignispositionen festzulegen.

Beachten Sie folgende Richtlinien:

  Der in dieses Feld eingegebene Wert wird als Schwellen- oder Grenzwert bei der Interpolationsmethode für die Ereignisposition verwendet. Wenn die Anzahl der fehlenden Meßepochen diesen Wert überschreitet, interpoliert das Basislinienverarbeitungsprogramm keine Ereignisposition. Die Voreinstellung beträgt 0. Das bedeutet, daß mindestens eine Messung direkt vor und eine Messung direkt nach dem Ereigniszeitpunkt erforderlich ist.

  Der Wert kann erhöht werden, um eine Ereignisposition zu erhalten, für die aufgrund fehlender Daten keine Position interpoliert wurde. Nehmen wir an, es handelt sich um eine kontinuierliche kinematische Vermessung, bei der Daten in Intervallen von 1,0 Sekunden aufgezeichnet werden und ein Ereignis mit einer Zeitkennzeichnung von 245742,2 Sekunden ausgelöst wurde. Wenn die maximal zulässige Anzahl fehlender Epochen 0 beträgt, müssen kontinuierliche kinematische Lösungen bei 245742,0 und 245743,0 verfügbar sein, damit die Ereignisposition berechnet werden kann. Wenn der kontinuierliche kinematische Vektor bei 245743,0 fehlt, wird keine Ereignisposition interpoliert. Wird der Wert für die maximal zulässige Anzahl fehlender Epochen auf 1 erhöht, kann die Ereignisposition berechnet werden, wenn ein Vektor bei 245744,0 vorhanden ist.

HINWEIS: Wenn der Wert zu stark erhöht wird, kann die Genauigkeit der interpolierten Position darunter leiden.

Zeit-Offset

Bearbeiten Sie dieses Feld, um ein konstantes Zeit-Offset zwischen dem Zeitpunkt, an dem das Ereignis im Empfänger aufgezeichnet wurde, und dem tatsächlichen Ereigniszeitpunkt anzuwenden.

Beachten Sie folgende Richtlinien:

  Das Zeit-Offset wird in Mikrosekunden eingegeben und kann positiv oder negativ sein. Positive Werte verzögern die Ereigniszeit, indem der Zeitkennzeichnung eine festgelegte Anzahl von Mikrosekunden hinzugefügt wird. Negative Wert haben den umgekehrten Effekt.

  Dieser Wert ist gemäß Voreinstellung auf Null festgelegt. Ändern Sie diesen Wert, wenn ein externes Gerät an den GPS-Empfänger angeschlossen ist und ein Zeit-Offset zwischen dem aufgezeichneten Ereignis und dem tatsächlichen Ereigniszeitpunkt besteht. Stellen Sie sich vor, daß bei einer Luftbildkamera der Verschluß ausgelöst wird, wenn eine geographische Geländeaufnahme gemacht wird. Die Kamera zeichnet den Zeitpunkt, an dem der Verschluß geöffnet wurde, als Ereigniszeitpunkt auf. Das Zeit-Offset ergibt sich dabei aus der verwendeten Belichtungszeit. Wenn die Belichtungszeit auf 1/1000 Sekunden eingestellt ist, wird das Bild 1/1000 Sekunden nach dem aufgezeichneten Ereigniszeitpunkt gemacht. Mit Hilfe dieses Feldes können Sie Zeit-Offsets dieser Art kompensieren.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten - Register OTF-Suche
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register OTF-Suche

Weitere Informationen

Wie kann ich ...	Siehe auch
Bearbeiten Sie diese Steuerungen, um die Variablen für die OTF (On-the-Fly)-Suche während des Durchgangs zur Auflösung von Mehrdeutigkeiten festzulegen.

So greifen Sie auf das Register OTF-Suche im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile. Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Stil-Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register OTF-Suche.

Suchmethode

Wählen Sie eine Option in dieser Gruppe, um die Methode für die Mehrdeutigkeitssuche bei der kinematischen OTF-Verarbeitung festzulegen:

  Optimale Suche − wählen Sie diese Option, um Float-Werte für Mehrdeutigkeiten zu verwenden, die bei den ersten Verarbeitungsdurchgängen geschätzt werden. Nachdem alle Schätzungen berechnet wurden, werden die Float-Mehrdeutigkeiten durchsucht und, falls möglich, auf ganzzahlige Werte festgelegt. Dies ist die Voreinstellung. Sie bietet die sorgfältigste Datenprüfung.

  Sequentielle Suche vorwärts − wählen Sie diese Option, um bei der Datenverarbeitung eine sequentielle Suche nach vorne durchzuführen. Die Suche beginnt beim ältesten Datensatz und endet bei den zuletzt aufgezeichneten Daten. Bei der Datenprüfung werden evtl. erforderliche Mehrdeutigkeitssuchen durchgeführt, z. B. wenn Phasensprünge entdeckt werden. Eine sequentielle Suche vorwärts ist nicht so zeitaufwendig wie eine optimale Suche.

  Sequentielle Suche rückwärts − wählen Sie diese Option, um bei der Datenverarbeitung eine sequentielle Suche rückwärts durchzuführen. Die Suche beginnt beim neuesten Datensatz und endet bei den ältesten Aufzeichnungsdaten. Bei der Datenprüfung werden evtl. erforderliche Mehrdeutigkeitssuchen durchgeführt, z. B. wenn Phasensprünge entdeckt werden. Eine sequentielle Suche rückwärts ist nicht so zeitaufwendig wie eine optimale Suche.

HINWEIS: Die sequentielle Steuerungsoption bestimmt die Methode zur Zurückweisung überprüfter Daten.

Sequentielle Steuerung

Das Feld Minimales Suchverhältnis wird verfügbar, abhängig von der Option, die Sie in der Gruppe Suchmethode gewählt haben. Verwenden Sie dieses Feld, um die Zurückweisungskriterien für die bei der OTF (on-the-Fly)-Suche überprüften Daten zu definieren.

Sie können das Verhältnis zur Zurückweisung der überprüften Daten bei den Durchgängen zur Auflösung von Mehrdeutigkeiten bearbeiten. Wenn das Suchverhältnis unter dem Wert liegt, der in dieses Feld eingegeben wurde, wird eine sofortige Suche zurückgewiesen und die Mehrdeutigkeiten werden nicht berechnet, bevor nicht alle anderen Daten überprüft wurden.


Dialogfeld GPS-Verarbeitungsstile - Überblick
    Dialogfeld GPS-Verarbeitungsstile − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld
Überblick

Verwenden Sie dieses Dialogfeld, um den aktiven GPS-Verarbeitungsstil auszuwählen, anzusehen, zu bearbeiten, zu erstellen, zu kopieren, umzubenennen und zu löschen.

So greifen Sie darauf zu:

  Wählen Sie Vermessung / GPS-Verarbeitungsstile.

Das Dialogfeld GPS-Verarbeitungsstile erscheint.

Folgende Steuerungen sind verfügbar:

Stil-Liste

Wenn ein Stil aus dieser Liste gewählt wird, wird er zum Aktiven Stil. Ein GPS-Verarbeitungsstil muß aktiv sein, bevor er bearbeitet, kopiert, umbenannt oder gelöscht werden kann. Der aktive Stil, der vor dem Verlassen des Dialogfelds festgelegt wird, enthält die Steuerungen für die nächste GPS-Verarbeitungssitzung.

Bearbeiten

Klicken Sie auf diese Schaltfläche, um den aktiven Stil anzusehen oder zu bearbeiten.

Neu

Klicken Sie auf diese Schaltfläche, um einen neuen Stil zu erstellen. Das Dialogfeld Neuer Stil erscheint. Zur Erstellung des neuen Stils werden die voreingestellten Stil-Optionen der Trimble Geomatics Office Software verwendet. (Vergewissern Sie sich, daß Sie Ihre eigenen Stil-Einstellungen festlegen, bevor Sie den voreingestellten Trimble-Stil löschen).

Kopieren

Klicken Sie auf diese Schaltfläche, um den aktiven Stil zu kopieren. Das Dialogfeld Stil kopieren erscheint.

Umbenennen

Klicken Sie auf diese Schaltfläche, um den aktiven Stil umzubenennen. Das Dialogfeld Stil umbenennen erscheint.

Löschen

Klicken Sie auf diese Schaltfläche, um den aktiven Stil zu löschen.


    Dialogfeld Neuer Stil

Weitere Informationen

Wie kann ich ...	Wie kann ich ...

Verwenden Sie dieses Dialogfeld, um einen neuen GPS-Verarbeitungsstil zu erstellen.

So greifen Sie auf das Dialogfeld Neuer Stil zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile.  Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Klicken Sie auf Neu. Das Dialogfeld Neuer Stil erscheint.

Name

Geben Sie die Bezeichnung für den neuen Stil in dieses Feld ein. Stilnamen können aus bis zu 255 Zeichen bestehen. Kürzere Namen sind jedoch in der Liste der Stile einfacher aufzufinden.

HINWEIS: Wenn Sie auf OK geklickt haben, um das Dialogfeld zu verlassen, erscheint das Dialogfeld Stil bearbeiten. Der gewählte Stilname wird in der Titelleiste des Dialogfelds angezeigt. Sie können die allgemeinen Stileinstellungen in diesem Dialogfeld bearbeiten und auf Fortgeschritten klicken, um die erweiterten Einstellungen zu bearbeiten.


    Dialogfeld Stil umbenennen

Weitere Informationen

Verwenden Sie dieses Dialogfeld, um einen GPS-Verarbeitungsstil umzubenennen.

So greifen Sie auf das Dialogfeld Stil umbenennen zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile.  Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie den gewünschten Stil aus der Liste. 	Der Name des Stils wird hervorgehoben.

3.	Klicken Sie auf Umbenennen. Das Dialogfeld Stil umbenennen erscheint.

Name

Geben Sie den neuen Stilnamen in dieses Feld ein. Stilnamen können aus bis zu 255 Zeichen bestehen. Kürzere Namen sind jedoch in der Liste der Stile einfacher aufzufinden.


    Dialogfeld Stil kopieren

Weitere Informationen

 Wie kann ich ...

Verwenden Sie dieses Dialogfeld, um den aktiven GPS-Verarbeitungsstil zu kopieren und ihn als Grundlage für einen neuen Stil zu verwenden.

So greifen Sie auf das Dialogfeld Stil kopieren zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile.  Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie den zu kopierenden Stil aus der Liste.

3.	Klicken Sie auf Kopieren. Das Dialogfeld Stil kopieren erscheint.

Name

Geben Sie den Namen des neuen Stils in dieses Feld ein. Stilnamen können aus bis zu 255 Zeichen bestehen. Kürzere Namen sind jedoch in der Liste der Stile einfacher aufzufinden.

HINWEIS: Wenn Sie auf OK geklickt haben, um das Dialogfeld zu verlassen, erscheint das Dialogfeld Stil bearbeiten. Der gewählte Stilname wird in der Titelleiste des Dialogfelds angezeigt. Sie können die allgemeinen Stileinstellungen in diesem Dialogfeld bearbeiten und auf Fortgeschritten klicken, um die erweiterten Einstellungen zu bearbeiten.


Dialogfeld Erweiterte Stil-Steuerungen bearbeiten - Register Global
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Register Global

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Bearbeiten Sie diese Steuerungen, um die allgemeinen Einstellungen für die statische und kinematische Verarbeitung zu ändern.

So greifen Sie auf das Register Allgemein im Dialogfeld Erweiterte Stil-Steuerungen bearbeiten zu:

1.	Wählen Sie Vermessung / GPS-Verarbeitungsstile.  Das Dialogfeld GPS-Verarbeitungsstile erscheint.

2.	Wählen Sie einen Stil aus der Liste.

3.	Klicken Sie auf Bearbeiten. Das Dialogfeld Stil bearbeiten erscheint.

4.	Klicken Sie auf Fortgeschritten. Das Dialogfeld Erweiterte Stil-Steuerungen bearbeiten erscheint.

5.	Wählen Sie das Register Allgemein.

Frequenztyp

Wählen Sie eine Option aus dieser Liste, um den Frequenztyp für den letzten GPS-Verarbeitungsdurchgang festzulegen.

  L1 − verwenden Sie diese Option, um die L1-Trägerphase auszuwählen. L1 ist die Voreinstellung.

  L2 − verwenden Sie diese Option, um die L2-Trägerphase auszuwählen.

  Wide lane − verwenden Sie diese Option, um den Widelane-Beobachtungswert mit einer Wellenlänge von ca. 86 cm zu wählen. Diese Wellenlänge ergibt sich aus der Subtraktion der L2-Trägerphase von der L1-Trägerphase (L1 – L2).

  Narrow lane − verwenden Sie diese Option, um den Narrowlane-Beobachtungswert mit einer Wellenlänge von ca. 11 cm zu wählen. Diese Wellenlänge ergibt sich aus der Addition der L1- und der L2-Trägerphase (L1 + L2).

Beachten Sie folgende Richtlinien:

  Wenn die Steuerung für den letzten Durchgang im Register Iono gewählt ist, wird der festgelegte Frequenztyp nur auf die Basislinien angewendet, die unterhalb des Grenzwerts für den letzten Iono-Durchgang liegen. Für längere Basislinien werden Iono-freie Lösungen berechnet

  Die Optionen L2, Widelane und Narrowlane stehen nicht zur Verfügung, wenn die Projektdaten Beobachtungen enthalten, die mit einem beliebigen Einfrequenz-Empfänger durchgeführt wurden. Alle Daten müssen mit Zweifrequenz-Empfängern aufgezeichnet worden sein, die über L2, Widelane und Narrowlane-Optionen verfügen.

Maximal behebbarer Phasensprung

Bearbeiten Sie dieses Feld, um das Zeitlimit für die Behebung eines Phasensprungs für die Basislinienverarbeitung festzulegen.

Beachten Sie folgende Richtlinien:

  Das GPS-Basislinienverarbeitungsprogramm versucht, Phasensprünge innerhalb des angegebenen Zeitlimits zu beheben.

  Es werden keine Phasensprünge behoben, wenn das festgelegte Zeitlimit überschritten wurde. Stattdessen wird eine separate Schätzung der Mehrdeutigkeiten für jede Seite des Phasensprungs durchgeführt.

HINWEIS: Sie können Phasensprünge in GPS-Messungen erkennen, indem Sie Timeline verwenden, um die Verfolgung individueller Satelliten zu überprüfen. Phasensprünge sind an Unterbrechungen in den L1- oder L2-Trägerphasen in der Timeline-Ansicht zu erkennen. Weitere Informationen finden Sie unter Timeline.

Maximale Iterationen

Bearbeiten Sie dieses Feld, um die maximale Anzahl der Iterationen einzugeben, die vom Basislinienverarbeitungsprogramm zur Berechnung von Basislinienlösungen verwendet werden soll. Sie können Werte von 1 bis 99 eingeben.

Beachten Sie folgende Richtlinien:

  Im Durchschnitt werden drei GPS-Verarbeitungsiterationen durchgeführt, um eine Basislinienlösung zu bestimmen. Wenn zehn Iterationen notwendig sind, könnte die Lösung unzuverlässig sein.

  Zehn Iterationen sind in der Regel ausreichend. Ändern Sie den Wert im Feld ‘Maximale Iterationen‘ nicht, wenn Sie nicht mit den Auswirkungen dieser Änderungen auf Ausgleichungen der kleinsten Quadrate vertraut sind.

Maximales Zeitlimit für Ganzzahl-Suche

Bearbeiten Sie dieses Feld, um das Zeitlimit für die Ganzzahl-Suche festzulegen. Diese Steuerung wird zur Verarbeitung langer Basislinien verwendet, vor allem dann, wenn Daten über einen langen Zeitraum (z. B. 24 Stunden oder länger) erfasst wurden.

Beachten Sie folgende Richtlinien:

  Unter bestimmten Bedingungen (wenn z. B. schlechte Koordinaten der Referenzstation verfügbar sind), kann das GPS-Verarbeitungsprogramm im wahrsten Sinne des Wortes nach unzähligen Kombinationen suchen, deren Berechnung mehrere Stunden in Anspruch nehmen kann. Wenn das festgelegte Zeitlimit abgelaufen ist, wird die Suche beendet, und das Programm berechnet eine Float-Lösung.

  Die Voreinstellung beträgt 30 Minuten.


    Dialogfeld GPS-Verarbeitung

Weitere Informationen

Wie kann ich ...	Siehe auch
Das Dialogfeld GPS-Verarbeitung enthält:

  den Verarbeitungsstatus

  die Anzahl verarbeiteter Basislinien

  die Anzahl der Basislinien, die akzeptiert oder zurückgewiesen wurden

So greifen Sie auf das Dialogfeld GPS-Verarbeitung zu:

1.	Wählen Sie die zu verarbeitenden Basislinien.

Die Basislinien werden im Graphikfenster hervorgehoben.

2.	Führen Sie einen der folgenden Schritte aus, um mit der Basislinienverarbeitung zu beginnen:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und die Basislinienverarbeitung beginnt.

Folgende Steuerungen sind verfügbar:

GPS-Verarbeitungsliste

Verwenden Sie diese Liste, um die Resultate der GPS-Verarbeitungssitzung zu prüfen.

Statusindikatoren für die GPS-Verarbeitung

Der Statusindikator auf der linken Seite der Statusleiste zeigt den Verarbeitungsstatus der Basislinienlösung an. Klicken Sie auf diesen Indikator, um das Dialogfeld GPS-Verarbeitung neu zu zentrieren.

Das zweite Indikatorfeld zeigt Meldungen an, die während der GPS-Verarbeitung erzeugt wurden. Individuelle Start- und Endpunkte für Basislinien werden im Verlauf der Verarbeitungssitzung angezeigt.

Die Anzahl der zu verarbeitenden Dateien und die Anzahl der noch zu verarbeitenden Basislinien werden im dritten Indikatorfeld auf der Statusleiste angezeigt. Das Indikatorfeld zeigt ‘Anstehend‘ an, wenn alle Basislinien verarbeitet, die berechneten Lösungen aber noch nicht mit Speichern im Projekt gespeichert wurden.

Der Statusindikator ganz rechts gibt die Anzahl aller akzeptierten und zurückgewiesenen Basislinien an.

Bevor die Verarbeitungssitzung beendet wird, wird die Meldung ‘Anstehend‘ in der Statusleiste angezeigt, was darauf hinweist, daß Lösungen berechnet, aber noch nicht im Projekt gespeichert wurden. Eine einzeilige Basislinienzusammenfassung wird im Tabellenformat angezeigt, wenn die Verarbeitung für die jeweiligen Basislinien beendet ist.

Stop / Speichern

Während der Verarbeitung können Sie auf Stop klicken, um die Verarbeitung zu unterbrechen, ohne die aktuelle Verarbeitungssitzung zu beenden. Ist die Verarbeitung beendet, ändert sich die Stop-Schaltfläche und wird zur Schaltfläche Speichern. Klicken Sie auf Speichern, um die in der GPS-Verarbeitungsliste ausgewählten Lösungen im Projekt zu speichern. Wenn eine Basislinienlösung ausgewählt wurde, erscheint ein Häkchen in dem davorstehenden Kontrollkästchen. Die Steuerung Doppelte Basislinienlösungen überschreiben wirkt sich, wie nachstehend beschrieben, auf das Speichern aus.

Abbrechen

Sie können diese Schaltfläche jederzeit wählen, um die GPS-Verarbeitungssitzungen abzubrechen, nachdem mit der Verarbeitung begonnen wurde, z. B.:

  Wenn die GPS-Verarbeitung bereits abgeschlossen ist, wenn auf diese Schaltfläche geklickt wird, werden Sie aufgefordert, das Abbrechen zu bestätigen. Wenn Sie auf Ja klicken, werden die berechneten Lösungen verworfen, und das Dialogfeld wird geschlossen. Wenn Sie auf Nein klicken, kehren Sie zum Dialogfeld GPS-Verarbeitung zurück.

  Wenn die GPS-Verarbeitung noch läuft, während Sie auf diese Schaltfläche klicken, wird die Verarbeitung beendet, nachdem die Lösung für die aktuelle Basislinie berechnet wurde, und Sie werden aufgefordert, das Abbrechen zu bestätigen. Wenn Sie auf Ja klicken, werden die berechneten Lösungen verworfen, und das Dialogfeld wird geschlossen. Wenn Sie auf Nein klicken, kehren Sie zum Dialogfeld GPS-Verarbeitung zurück.

Bericht

Wählen Sie diese Schaltfläche, um den GPS-Basislinienverarbeitungsbericht für die ausgewählte Basislinienlösung anzusehen. Sie müssen zuerst eine Basislinienlösung aus der GPS-Verarbeitungsliste wählen, bevor diese Schaltfläche zur Verfügung steht.

Wenn der Bericht angezeigt wird, können Sie durch den Bericht navigieren, um sich bestimmte Informationen anzeigen zu lassen. Sie können den Bericht in eine Textdatei kopieren oder ihn auf einem Drucker oder in eine Datei drucken. Sie müssen nicht warten, bis alle Basislinien verarbeitet sind, um sich den Bericht anzusehen. Berichte können erstellt werden, sobald die erste Basislinienlösung in der GPS-Verarbeitungsliste angezeigt wird.

Doppelte Basislinienlösungen überschreiben

Diese Option legt fest, wie Basislinien nach einer Neuberechnung gespeichert werden. Das Kontrollkästchen ist gemäß Voreinstellung aktiviert. Das bedeutet, daß bestehende Basislinienlösungen überschrieben werden. Wenn das Kontrollkästchen deaktiviert ist, wird die neue Lösung im Projekt gespeichert, und die alte Lösung wird ebenfalls beibehalten. Die neue Lösung wird dabei zur aktiven Lösung und die alte Lösung wird inaktiv. Im Eigenschaftsfenster kann eine alte inaktive Lösung wieder als aktive Lösung eingestellt werden.

Das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ gilt nur für Basislinien, die mehrfach berechnet wurden. Basislinien, die zwischen denselben Punkten zu einem anderen Zeitpunkt oder an einem anderen Tag aus GPS-Daten berechnet wurden, sind hiervon nicht betroffen. Trimble empfiehlt, alte Basislinienlösungen immer zu überschreiben.


    GPS-Verarbeitungsliste

Weitere Informationen

Dialogfeld	Siehe auch
Die GPS-Verarbeitungsliste enthält eine einzeilige Zusammenfassung der Basislinienlösung im Tabellenformat. Eine weitere Linie wird dieser Liste hinzufügt, wenn eine zusätzliche Basislinienlösung berechnet wird. Sie können die Reihenfolge der Zusammenfassung ändern, indem Sie auf einen beliebigen Spaltenkopf klicken. Wenn Sie auf einen Spaltenkopf klicken, wird die Liste nach den in dieser Spalte enthaltenen Werten sortiert. Das Sortieren erleichtert das Auffinden von Basislinien mit einem schlechten Verhältnis, einem hohen RMS oder einer hohen Referenzvarianz.

Die GPS-Verarbeitungsliste enthält folgende Spalten:

Verwenden

Dieses Kontrollkästchen ist aktiviert, wenn eine Basislinienlösung verarbeitet wurde und den Resultaten auf der Grundlage der Akzeptanzkriterien ein Akzeptanz- oder Kennzeichnungsstatus zugewiesen wurde. Wenn die Lösung aufgrund der festgelegten Verhältnis-, Referenzvarianz- und RMS-Parameter zurückgewiesen wurde, ist das Kontrollkästchen nicht aktiviert. Nur Basislinienlösungen mit aktiviertem Kontrollkästchen werden im Projekt gespeichert, wenn auf die Schaltfläche Speichern geklickt wird.

Basislinien-ID

Die Beobachtungskennung für die Basislinie im Projekt.

Von Station

Der Punkt, an dem die Basislinie beginnt.

Nach Station

Der Punkt, an dem die Basislinie endet. Die Koordinaten dieses Punktes werden abgeleitet, indem die Basislinienkomponenten zu den Stationskoordinaten addiert werden.

Basislinienlänge

Die Schrägstrecke der Basislinie.

Lösungstyp

Der endgültige Lösungstyp der vom Verarbeitungsprogramm für die Basislinie bestimmt wurde. In den meisten Fällen ist der Lösungstyp entweder L1 Fixed, L1 Float, Iono-frei Fixed oder Iono-frei Float.

Verhältnis

Das Verhältnis gibt das Bewertungsverhältnis zwischen der Varianz der bestmöglichen Basislinienlösung zur zweitbesten Basislinienlösung an (nur für Fixed-Lösungen).

Ref.var

Die Referenzvarianz ist ein einheitloser Wert, der angibt, wie gut der tatsächliche Fehler der Basislinienlösung mit dem geschätzten Fehler übereinstimmt.

HINWEIS: Bewerten Sie das Verhältnis und die Referenzvarianz nie getrennt. Ihre besondere Aufmerksamkeit sollte Basislinien mit einem schlechten Verhältnis und einer hohen Referenzvarianz gelten.

RMS

RMS ist der quadratische mittlere Fehler der Beobachtungslösung

HINWEIS: Die Lösungszusammenfassung bietet nur einen begrenzten Überblick über die GPS-Verarbeitungsresultate. Bewerten Sie den GPS-Basislinienverarbeitungsbericht, um detaillierte Informationen für die Basislinienverarbeitung zu erhalten. Sie können diesen Bericht sofort nach der Verarbeitung individueller Lösungen anzeigen lassen, indem Sie eine Lösung aus der Liste wählen und auf Bericht klicken. Sie müssen nicht warten, bis alle Lösungen berechnet wurden, um einen Bericht über individuelle Basislinien zu erhalten. Das Verarbeitungsprogramm fährt mit der Basislinienverarbeitung fort, während Sie die Berichte für die einzelnen Lösungen ansehen.

Nachdem das Dialogfeld GPS-Verarbeitung geschlossen wurde, können Sie den Bericht ansehen, indem Sie die Basislinie im Graphikfenster auswählen und den Befehl Berichte / Bericht GPS-Basislinienverarbeitung wählen. Die im Bericht enthaltenen Informationen können nach Bedarf im Dialogfeld Einstellungen GPS-Basislinienverarbeitungsbericht festgelegt werden.


    Doppelte Basislinienlösungen überschreiben

Weitere Informationen

 Siehe auch

Diese Option legt fest, wie Basislinien nach einer Neuberechnung gespeichert werden. Das Kontrollkästchen ist gemäß Voreinstellung aktiviert. Das bedeutet, daß bestehende Basislinienlösungen überschrieben werden. Wenn das Kontrollkästchen deaktiviert ist, wird die neue Lösung im Projekt gespeichert, und die alte Lösung wird ebenfalls beibehalten. Die neue Lösung wird dabei zur aktiven Lösung und die alte Lösung wird inaktiv. Im Eigenschaftsfenster kann eine alte inaktive Lösung wieder als aktive Lösung eingestellt werden.

Das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ gilt nur für Basislinien, die mehrfach berechnet wurden. Basislinien, die zwischen denselben Punkten zu einem anderen Zeitpunkt oder an einem anderen Tag aus GPS-Daten berechnet wurden, sind hiervon nicht betroffen. Trimble empfiehlt, alte Basislinienlösungen immer zu überschreiben.

Zusätzliche Informationen

Bei der Verarbeitung von GPS-Daten muß eine Reihe von Faktoren berücksichtigt werden. Weitere Informationen über die GPS-Basislinienverarbeitung finden Sie unter folgenden Themen:

  Potentielle Basislinien bestimmen

  Basislinien für die Verarbeitung auswählen

  Einen GPS-Verarbeitungsstil wählen

  Das Basislinienverarbeitungsprogramm starten

  Die Verarbeitungsresultate ansehen

  Die Verarbeitungsresultate speichern

  Basislinien erneut verarbeiten


GPS-Basislinienverarbeitung - Inhalt
    GPS-Basislinienverarbeitung − Inhalt

Inhalt

Folgende Hilfethemen stehen zur Verfügung:

  GPS-Basislinienverarbeitung - Überblick

  GPS-Basislinien verarbeiten

  Datenquellen für Basislinien

  GPS-Verarbeitungsbefehle

  GPS-Verarbeitungsstile

  Datenanalyse der GPS-Verarbeitung

  GPS-Basislinienverarbeitungsbericht

  Timeline

Drücken Sie F1, um Informationen zur Verwendung der Hilfe zu erhalten.

Wenn Sie ein Problem haben und die benötigten Informationen nicht in diesem Hilfesystem finden können, setzen Sie sich mit Ihrer örtlichen Trimble-Vertretung oder mit der Technischen Unterstützung. in Verbindung.

© 1999-2002, Trimble Navigation Limited. Alle Rechte vorbehalten.


GPS-Basislinienverarbeitungsbericht - Überblick
    GPS-Basislinienverarbeitungsbericht − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Verwenden Sie den GPS-Basislinienverarbeitungsbericht, um sich detaillierte Informationen über Basislinienlösungen anzusehen.

So greifen Sie auf den Bericht zu:

1.	Beginnen Sie mit der Basislinienverarbeitung. Das Dialogfeld GPS-Verarbeitung erscheint.

2.	Wählen Sie eine Basislinienlösung aus der GPS-Verarbeitungsliste. Die Lösung wird hervorgehoben.

3.	Klicken Sie auf Bericht. Der GPS-Basislinienverarbeitungsbericht mit den Basislinienlösungen erscheint.

Der GPS-Basislinienverarbeitungsbericht kann die folgenden Berichtabschnitte enthalten:

  Verarbeitungszusammenfassung

  Basislinienkomponenten

  Besetzungen

  Zusammenfassungen der SV-Verfolgung

  Restwerte

  Verarbeitungsstil

Die Abschnitte, die im Bericht enthalten sein sollen und die Daten, die für die Basislinien verarbeitet werden sollen, werden über die Optionen im Dialogfeld Einstellungen GPS-Basislinienverarbeitungsbericht festgelegt.


Dialogfeld Erweiterte Stil-Steuerungen - Überblick
    Dialogfeld Erweiterte Stil-Steuerungen bearbeiten − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Mit GPS-Verarbeitungsstilen können Sie die Basislinienverarbeitung individuell gestalten. Sie können festlegen, ob bei der Verarbeitung z. B. genaue Ephemeriden oder eine bestimmte Höhenmaske verwendet werden sollen. Die Einstellungen können als Stil unter einem eigenen Namen gespeichert werden. Der Stil kann später unter Angabe der Stilbezeichnung erneut aufgerufen werden. Sie können auf diese Weise eine Stilbibliothek für häufig verwendete Anwendungen anlegen.

Die wichtigsten allgemeinen Steuerungen sind über das Hauptdialogfeld GPS-Verarbeitungsstile einfach zugänglich. Zusätzliche erweiterte Steuerungen stehen zur Ansicht und zur Stil-Bearbeitung zur Verfügung. Diese Steuerungen sind in einem Dialogfeld enthalten und in Registern organisiert.

Folgende Register stehen zur Verfügung:

  Statisch

  Kinematisch

  Global

  Qualität

  Tropo

  Iono

  Ereignisse

  OTF-Suche


GPS-Datenquellen - Überblick
    GPS-Datenquellen − Überblick

Weitere Informationen

 Siehe auch

Überblick

Das Basislinienverarbeitungsprogramm verwendet Messungen von GPS-Empfängern zur Berechnung von Basislinien. Diese Messungen können in folgenden Geräten gespeichert bzw. von diesen Geräten in das Verarbeitungsprogramm übertragen werden:

  Trimble-Datenrekorder (*.dc)

  Trimble-Empfänger (*.dat)

  Empfänger anderer Hersteller (RINEX)

Zusätzlich zu den GPS-Messungen enthalten die Dateien Informationen darüber, mit welcher Methode GPS-Messungen verarbeitet werden sollen (z. B. zu welchem Zeitpunkt sich ein Empfänger stationär an einem Punkt befand und wann er bewegt wurde). Das Verarbeitungsprogramm kann die GPS-Messungen anhand dieser Informationen in folgende Kategorien einteilen:

  Statische/FastStatic-GPS-Daten

  Kinematische Daten

  Roving und kontinuierliche kinematische Daten


GPS-Verarbeitungsstile - Überblick
    GPS-Verarbeitungsstile − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Mit GPS-Verarbeitungsstilen können Sie die Basislinienverarbeitung individuell gestalten. Sie können festlegen, ob bei der Verarbeitung z. B. genaue Ephemeriden oder eine bestimmte Höhenmaske verwendet werden sollen. Die Einstellungen können als Stil mit einem eigenen Namen gespeichert werden. Der Stil kann später unter Angabe der Stilbezeichnung erneut aufgerufen werden. Sie können auf diese Weise eine Stilbibliothek für häufig verwendete Anwendungen anlegen. GPS-Verarbeitungsstile werden systemweit verwendet. Sie können für alle Projekte in Ihrem Computer neue Stile erstellen und bestehende Stile ändern.

Die allgemeinen Stilsteuerungen sind im Dialogfeld GPS-Verarbeitungsstile enthalten. Der aktuell gewählte Stil wird als Aktiver Stil bezeichnet. Der aktive Stil enthält die Programmsteuerungen für die nachfolgenden Basislinienverarbeitungssitzungen in einem Projekt. Unterschiedliche Projekte können mehrere aktive Stile haben. Der aktive Stil kann zwischen Verarbeitungssitzungen geändert werden. Sie können im Dialogfeld GPS-Verarbeitungsstile darüber hinaus Stile bearbeiten, kopieren, erstellen, umbenennen und löschen.

Die Trimble Geomatics Office Software enthält den voreingestellten Trimble GPS-Verarbeitungsstil. Dieser Stil ist für die meisten Vermessungen geeignet. Wenn Sie die Stilsteuerungen ändern, sollten Sie sich über mögliche Auswirkungen dieser Änderungen im klaren sein, bevor Sie die Änderungen speichern.

Weitere Informationen finden Sie unter Stile bearbeiten.


GPS-Basislinienverarbeitung - Überblick
    GPS-Basislinienverarbeitung − Überblick

Weitere Informationen

 Siehe auch

Überblick

Mit der Trimble Geomatics Office Software können Sie GPS-Basislinienlösungen nachverarbeiten, wenn das Baseline Processing Modul auf Ihrem Computer installiert ist. Das Basislinienverarbeitungsmodul enthält WAVE™ (das Weighted Ambiguity Vector Estimator Programm). Dieses Programm berechnet Basislinienlösungen aus GPS-Feldbeobachtungen, die mit statischen, FastStatic oder kinematischen Datenerfassungsmethoden aufgezeichnet wurden. Das Basislinienverarbeitungsprogramm verwendet sowohl Code- als auch Trägerphasenbeobachtungen, um dreidimensionale GPS-Basislinien zwischen Vermessungspunkten zu erstellen.

Die Nachverarbeitung mit  der Trimble Geomatics Office Software ist einfach. Das Basislinienverarbeitungsprogramm enthält eine Reihe konfigurierter Systemvoreinstellungen, die die Voraussetzungen für die meisten Vermessungsprojekte erfüllen. Die Nachverarbeitungssteuerungen können nach Bedarf in den GPS-Verarbeitungsstilen zur erweiterten Verarbeitung und Neuberechnung modifiziert und gespeichert werden.

Getrennte Verarbeitungssitzungen für GPS-Daten, die mit unterschiedlichen Vermessungsmethoden aufgezeichnet wurden, sind nicht erforderlich. Das Verarbeitungsprogramm prüft die zu verarbeitenden Daten und legt automatisch die Verarbeitungsstrategien fest. Daten aus statischen, FastStatic- und kinematischen Vermessungen können gleichzeitig verarbeitet werden. Hierfür müssen (falls überhaupt) die Einstellungen nur geringfügig geändert werden.


    Potentielle Basislinien bestimmen

Weitere Informationen

 Siehe auch

Eine potentielle Basislinie wird im Graphikfenster angezeigt, wenn Sie GPS-Messungen importieren, die von zwei Empfängern gleichzeitig über einen bestimmten Zeitraum erfasst wurden. Der Überschneidungszeitraum muß größer sein als die für die Verarbeitung erforderliche Mindestzeit. Potentielle Basislinien sind Basislinien, die vom Basislinienverarbeitungsprogramm noch nicht berechnet wurden.

Die Trimble Geomatics Office Software bestimmt diese Basislinien automatisch. Immer, wenn GPS-Messungen in ein Projekt importiert werden, sucht die Software nach Datensätzen die zur gleichen Zeit erfasst wurden und verarbeitet werden können. Eine potentielle Basislinie wird zu dem Projekt hinzugefügt, wenn das Programm zwei Datensätze findet, die sich zeitlich überschneiden, die die im aktiven Verarbeitungsstil festgelegten Kriterien für die Mindestbeobachtungszeit für Basislinien erfüllen, oder wenn eine Besetzungskennung in kinematischen Datensätzen gefunden wird.

HINWEIS: Wenn Sie Datensegmente, die über mehrere Stunden aufgezeichnet wurden, von einer GPS-Basisstation heruntergeladen haben, bevor Sie die Daten in die Trimble Geomatics Office Software importiert haben, kombinieren Sie diese Daten unter Verwendung des Rinmerge-Programms in einer einzigen Datei.


    Basislinien zur Verarbeitung auswählen

Weitere Informationen

 Siehe auch

Gemäß Voreinstellung werden alle potentiellen Basislinien in einem Projekt verarbeitet, wenn der Befehl Vermessung / GPS-Basislinien verarbeiten gewählt wird. Zur Verarbeitung aller im Projekt enthaltenen bzw. neu zum Projekt hinzugefügten potentiellen Basislinien ist kein zusätzlicher Schritt erforderlich.

Es können auch ganz gezielt eine oder mehrere Basislinien zur Verarbeitung oder Neuberechnung ausgewählt werden. Die entsprechenden Basislinien werden ausgewählt, bevor der Befehl Vermessung / GPS-Basislinien verarbeiten gewählt wird. Bei der Auswahl einer oder mehrerer Basislinien wird nur eine bestimmte Auswahlmenge berücksichtigt.

Verwenden Sie eine der folgenden Standardmethoden, um die Auswahlmenge festzulegen:

  Klicken Sie im Graphikfenster auf eine oder mehrere Basislinien

  Wählen / ‘Nach Abfrage‘

  Vorherige Auswahlmenge

HINWEIS: Wenn das Basislinienverarbeitungsprogramm die potentiellen Basislinien im Projekt nicht verarbeitet und eine Meldung angezeigt wird, daß keine Basislinien zur Verarbeitung ausgewählt wurden, haben Sie sich möglicherweise für eine Auswahlmenge entschieden, die keine GPS-Basislinien oder keine kinematische Basis enthält. Klicken Sie in diesem Fall auf einen leeren Bereich in der Karte im Graphikfenster, und starten Sie die Basislinienverarbeitung erneut. Mit Hilfe der Optionen im Dialogfeld Ansicht Filter können Sie einen Vektor-Unterdatensatz zur Verarbeitung oder Neuberechnung bestimmen.

Wenn das Projekt kontinuierliche kinematische Daten enthält, werden gemäß Voreinstellung alle nicht verarbeiteten kinematischen Basisstandpunkte berechnet. Um kontinuierliche kinematische Daten von einer bestimmten Basis aus zu berechnen, müssen Sie den Basis-Standpunkt wählen und die Verarbeitung starten.

Basislinien werden sequentiell verarbeitet. Der Basislinienverlauf, der Standpunkt der Basisstation und des Rovers werden automatisch vom Programm bestimmt. Die optimale Richtung für die Übertragung genauer Koordinaten wird gewählt. Die Übertragung genauer Festpunktkoordinaten von einem Punkt zu einem anderen wird als ‘Koordinatenfortpflanzung‘ bezeichnet. Das Verarbeitungsprogramm wählt bei der Verarbeitung automatisch die Punkte mit der bestmöglichen Qualität für die Koordinatenfortpflanzung aus. Die Basislinien werden aus diesen Punkten berechnet.

Normalerweise legt das Programm die angemessene Verarbeitungsrichtung fest, vor allem, wenn das Festpunktnetz und die Feldbeobachtungen sorgfältig ausgewählt wurden. In einigen Fällen müssen Sie möglicherweise den umgekehrten Basislinienverlauf beobachten. Dazu tauschen die Basis und der Rover die Position. Wenn Sie den Beobachtungsfluß nach der Berechnung umkehren möchten, wählen Sie die entsprechende Basislinie auf der Karte im Graphikfenster, und wählen Sie dann Bearbeiten / Beobachtungsfluß umkehren.

Der Beobachtungsfluß für die Basislinie kann umgedreht werden, um die Verarbeitung in einer bestimmten Richtung zu erzwingen. Ein Pfeil auf der Basislinie zeigt die Richtung des  Beobachtungsflusses an. Kehren Sie den Beobachtungsfluß nach Bedarf um, um die Berechnung in der gewünschten Richtung zu erzwingen.

HINWEIS: Wenn Sie Datensegmente, die über mehrere Stunden aufgezeichnet wurden, von einer GPS-Basisstation heruntergeladen haben, bevor Sie die Daten in die Trimble Geomatics Office Software importiert haben, kombinieren Sie diese Daten unter Verwendung des Rinmerge-Programms in einer einzigen Datei.


    Den GPS-Verarbeitungsstil wählen

Weitere Informationen

Wie kann ich ...	Dialogfeld
Mit GPS-Verarbeitungsstilen können Sie die Basislinienverarbeitung individuell gestalten. Sie können festlegen, ob bei der Verarbeitung z. B. genaue Ephemeriden oder eine bestimmte Höhenmaske verwendet werden sollen. Die Einstellungen können als Stil mit einem eigenen Namen gespeichert werden. Der Stil kann später unter Angabe der Stilbezeichnung erneut aufgerufen werden. Sie können auf diese Weise eine Stilbibliothek für häufig verwendete Anwendungen anlegen. GPS-Verarbeitungsstile werden systemweit verwendet. Sie können für alle Projekte in Ihrem Computer neue Stile erstellen und bestehende Stile ändern.

Das Dialogfeld GPS-Verarbeitungsstile enthält die Stilsteuerungen. Der aktuell gewählte Stil wird als aktiver Stil bezeichnet. Der aktive Stil enthält die Programmsteuerungen für die nachfolgenden Basislinienverarbeitungssitzungen in einem Projekt. Wenn ein Stil aus der Stil-Liste gewählt wird, wird er zum aktiven Projektstil.

Unterschiedliche Projekte können mehrere aktive Stile haben. Der aktive Stil kann zwischen Verarbeitungssitzungen geändert werden. Sie können im Dialogfeld GPS-Verarbeitungsstile darüber hinaus Stile bearbeiten, kopieren, erstellen, umbenennen und löschen.

Die Trimble Geomatics Office Software enthält den voreingestellten Trimble GPS-Verarbeitungsstil. Dieser Stil ist für die meisten Vermessungen geeignet. Wenn Sie die Stilsteuerungen ändern, sollten Sie sich über mögliche Auswirkungen dieser Änderungen im klaren sein, bevor Sie die Änderungen speichern.


    Wann wird das GPS-Basislinienverarbeitungsprogramm verwendet?

Weitere Informationen

 Siehe auch

Die meisten Vermesser verarbeiten Vermessungsdaten direkt nach einer Feldsitzung, um festzustellen, ob bestimmte Basislinien erneut beobachtet werden müssen.

Bevor Sie das Basislinienverarbeitungsprogramm verwenden, sollten Sie:

  das Projekt erstellen.

  die Beobachtungen im Feld planen (empfohlen).

  die Daten im Feld erfassen.

  Daten von Empfängern, Vermessungsgeräten oder von Ihrem Computer in das Projekt in der Trimble Geomatics Office Software laden.

Die Basislinienverarbeitung ist normalerweise nicht der Abschluß eines Vermessungsprojekts. Die Verarbeitungsresultate geben Auskunft über die Gesamtqualität der durchgeführten GPS-Messungen. Bei einer Vermessung sollte für alle Beobachtungen auch immer eine Netzausgleichung durchgeführt werden. Die Netzausgleichung hilft bei der Bestimmung der Konsistenz der beobachteten Basislinien im Netz. Darüber hinaus werden bei der Ausgleichung endgültige Koordinaten erzeugt. Weitere Informationen zu diesem Thema finden Sie in der Netzausgleichungshilfe der Trimble Geomatics Office Software.


GPS-Basislinienverarbeitungsbefehle - Überblick
    GPS-Basislinienverarbeitungsbefehle − Überblick

Weitere Informationen

 Siehe auch

Überblick

Befehle zur GPS-Basislinienverarbeitung sind in den Menüs Vermessung und Berichte enthalten.

Im Menü Vermessung stehen folgende Befehle zur Verfügung:

  GPS-Verarbeitungsstile

  GPS-Basislinien verarbeiten

Im Menü Berichte stehen folgende Befehle zur Verfügung:

  Bericht GPS-Basislinienverarbeitung

  Einstellungen GPS-Basislinienverarbeitungsbericht

Im Menü Ansicht stehen folgende Befehle zur Verfügung:

  Timeline

  Timeline-Plots (Symbolleisten)

  Timeline (Symbolleisten)

Die folgenden Befehle können in der Vermessungsansicht aufgerufen werden. Sie sind vor und nach der Verarbeitung von GPS-Basislinien hilfreich:

  Bericht GPS-Schleifenschluß

  Neu berechnen

  Bericht Neuberechnung

  Timeline


GPS-Basislinien verarbeiten - Überblick
    GPS-Basislinien verarbeiten − Überblick

Das Basislinienverarbeitungsprogramm berechnet Basislinien aus GPS-Feldbeobachtungen, die mit statischen, FastStatic- oder kinematischen Datenerfassungsmethoden aufgezeichnet wurden. Das Programm verwendet sowohl Trägerphasen- als auch Code-Beobachtungen, um dreidimensionale Basislinien zwischen Vermessungspunkten zu erstellen.

Bei der Verarbeitung von GPS-Daten muß eine ganze Reihe von Faktoren berücksichtigt werden. Weitere Informationen über die Verarbeitung von GPS-Basislinien finden Sie unter folgenden Themen:

  Potentielle Basislinien bestimmen

  Basislinien zur Verarbeitung auswählen

  Einen GPS-Verarbeitungsstil wählen

  Das Basislinienverarbeitungsprogramm starten

  Die Verarbeitungsresultate ansehen

  Die Verarbeitungsresultate speichern

  Basislinien erneut verarbeiten


    Das GPS-Basislinienverarbeitungsprogramm starten

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Das Basislinienverarbeitungsprogramm steht nur in der Vermessungsansicht zur Verfügung, wenn zwei oder mehrere GPS-Dateien in das Projekt importiert wurden.

Alle potentiellen Basislinien berechnen

So berechnen Sie alle potentiellen Basislinien:

1.	Öffnen Sie ein Projekt, das eine oder mehrere potentielle Basislinien enthält.

2.	Führen Sie einen der nachfolgenden Schritte aus, um die Basislinienverarbeitung zu starten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und das Basislinienverarbeitungsprogramm beginnt mit der Berechnung aller potentiellen Basislinien.

Eine oder mehrere ausgewählte Basislinien verarbeiten

So verarbeiten Sie eine oder mehrere ausgewählte Basislinien:

1.	Öffnen Sie ein Projekt, daß eine oder mehrere potentielle oder gespeicherte Basislinien enthält.

2.	Führen Sie einen der nachfolgenden Schritte aus, um die zu verarbeitenden Basislinien mit Hilfe der Standardmethoden auszuwählen:

  Klicken Sie im Graphikfenster auf eine oder mehrere Basislinien

 Wählen / ’Nach Abfrage‘

 Vorherige Auswahlmenge

3.	Die ausgewählten Basislinien werden im Graphikfenster hervorgehoben und als dickere Linien dargestellt.

4.	Führen Sie einen der nachfolgenden Schritte aus, um das Verarbeitungsprogramm zu starten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und das Basislinienverarbeitungsprogramm beginnt mit der Berechnung aller ausgewählten Basislinien.

Kontinuierliche kinematische Basislinien verarbeiten

So verarbeiten Sie kontinuierliche kinematische Basislinien:

1.	Öffnen Sie ein Projekt, das kontinuierliche kinematische Daten enthält.

2.	Wählen Sie den Punkt, an dem sich der Basis-Empfänger während der Vermessung befand.

3.	Führen Sie einen der nachfolgenden Schritte aus, um das Verarbeitungsprogramm zu starten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und das Basislinienverarbeitungsprogramm beginnt mit der Berechnung kinematischer Basislinien.

Einen bestimmten Satz kinematischer Basislinien verarbeiten

So verarbeiten Sie einen bestimmten Satz kontinuierlicher kinematischer Basislinien:

1.	Öffnen Sie ein Projekt, das kontinuierliche kinematische Daten enthält.

2.	Führen Sie einen der nachfolgenden Schritte aus, um Timeline anzuzeigen:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

Die Timeline-Ansicht erscheint.

3.	Wählen Sie die Besetzung des Basis-Empfängers für die Vermessung.

4.	Führen Sie einen der nachfolgenden Schritte aus, um das Verarbeitungsprogramm zu starten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Drücken Sie F9.

Das Dialogfeld GPS-Verarbeitung erscheint, und das Basislinienverarbeitungsprogramm beginnt mit der Verarbeitung der kinematischen Basislinien.

Die Statusleiste im Dialogfeld GPS-Verarbeitung prüfen

Die Statusleiste im unteren Teil des Dialogfelds GPS-Verarbeitung zeigt den Verarbeitungsstatus an, wenn die Dateien zur Verarbeitung geladen werden. Die Namen der Anfangs- und Endstandpunkte (Von Station und Nach Station) werden bei der Verarbeitung für jede Basislinie angegeben. Eine einzeilige Zusammenfassung mit den Verarbeitungsresultaten erscheint in der GPS-Verarbeitungsliste, wenn eine Lösung für eine Basislinie erstellt wurde. Das Basislinienverarbeitungsprogramm verarbeitet danach die nächste Basislinie. Die Statusleiste wird nach der Verarbeitung einer jeden Basislinie aktualisiert, um den aktuellen Verarbeitungsstatus wiederzugeben. Sie enthält ebenfalls die Anzahl der akzeptierten (Akz.) und zurückgewiesenen (Verw.) Lösungen. Die Akzeptanzkriterien sind im aktiven GPS-Verarbeitungsstil festgelegt.

Weitere Informationen über Basislinienverarbeitungssitzungen finden Sie unter Basislinienverarbeitungsprotokoll.


    Die Verarbeitungsresultate ansehen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Das Dialogfeld GPS-Verarbeitung wird bei der Basislinienverarbeitung automatisch angezeigt. Die Statusleiste im unteren Teil des Dialogfelds gibt den Verarbeitungsstatus an, wenn die Dateien zur Verarbeitung geladen werden. Die Namen der Anfangs- und Endstandpunkte (Von Station und Nach Station) werden während der Bearbeitung für jede Basislinie angegeben. Eine einzeilige Zusammenfassung mit den Verarbeitungsresultaten erscheint in der GPS-Verarbeitungsliste, wenn eine Lösung für eine Basislinie erstellt wurde. Das Basislinienverarbeitungsprogramm verarbeitet danach die nächste Basislinie. Die Statusleiste wird nach der Verarbeitung einer jeden Basislinie aktualisiert, um den aktuellen Verarbeitungsstatus wiederzugeben. Sie enthält ebenfalls die Anzahl der akzeptierten (Akz.) und zurückgewiesenen (Verw.) Lösungen. Die Akzeptanzkriterien sind im aktiven GPS-Verarbeitungsstil festgelegt.

Weitere Informationen finden Sie unter folgenden Themen:

  Das Dialogfeld GPS-Verarbeitung verwenden

  Den GPS-Basislinienverarbeitungsbericht verwenden


    Das Dialogfeld GPS-Verarbeitung verwenden

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Das Dialogfeld GPS-Verarbeitung enthält:

  den Verarbeitungsstatus

  die Anzahl der verarbeiteten Basislinien

  die Anzahl der Basislinien die akzeptiert oder zurückgewiesen wurden

  eine einzeilige Zusammenfassung der Verarbeitungsresultate in Tabellenform

  den anstehenden Status verarbeiteter Basislinien

Im Dialogfeld GPS-Verarbeitung können darüber hinaus:

  Verarbeitungsresultate für Basislinien im Projekt gespeichert werden

  ein Bericht über die GPS-Basislinienverarbeitung erzeugt werden

  die Speicheroptionen für die Basislinien nach der Verarbeitung festgelegt werden

Folgende Steuerungen stehen zur Verfügung:

GPS-Verarbeitungsliste

Verwenden Sie diese Liste, um die Ergebnisse der GPS-Verarbeitungssitzung zu überprüfen. Weitere Informationen über die Spalten in dieser Liste finden Sie unter GPS-Verarbeitungsliste.

Statusindikatoren für die GPS-Verarbeitung

Ein GPS-Verarbeitungsindikator wird auf der Statusleiste angezeigt. Klicken Sie auf diesen Indikator, um das Dialogfeld GPS-Verarbeitung neu zu zentrieren.

Der Statusindikator auf der linken Seite der Statusleiste gibt Auskunft über den Verarbeitungsstatus individueller Basislinien.

Das zweite Indikatorfeld zeigt Meldungen an, die während der GPS-Verarbeitung erzeugt wurden. Individuelle Start- und Endpunkte für Basislinien werden im Verlauf der Verarbeitungssitzung angezeigt.

Die Anzahl der zu verarbeitenden Dateien und die Anzahl der noch zu verarbeitenden Basislinien werden im dritten Indikatorfeld von rechts auf der Statusleiste angezeigt. Das Indikatorfeld zeigt ‘Anstehend‘ an, wenn alle Basislinien verarbeitet, die berechneten Lösungen aber noch nicht mit Speichern im Projekt gespeichert wurden.

Der Statusindikator ganz rechts gibt die Anzahl aller akzeptierten und zurückgewiesenen Basislinien an.

Stop / Speichern

Während der Verarbeitung können Sie auf Stop klicken, um die Verarbeitung zu unterbrechen, ohne dabei die aktuelle Verarbeitungssitzung zu beenden. Ist die Verarbeitung beendet, ändert sich die Stop-Schaltfläche und wird zur Schaltfläche Speichern. Klicken Sie auf Speichern, um die in der GPS-Verarbeitungsliste ausgewählten Lösungen im Projekt zu speichern. Wenn eine Basislinienlösung ausgewählt wurde, erscheint ein Häkchen in dem davorstehenden Kontrollkästchen. Die Steuerung Doppelte Basislinienlösungen überschreiben wirkt sich, wie nachstehend beschrieben, auf das Speichern aus.

Abbrechen

Sie können diese Schaltfläche jederzeit wählen, um die GPS-Verarbeitungssitzungen abzubrechen, nachdem mit der Verarbeitung begonnen wurde, z. B.:

  Ist die GPS-Verarbeitung bereits abgeschlossen, wenn auf diese Schaltfläche geklickt wird, werden Sie aufgefordert, das Abbrechen zu bestätigen. Wenn Sie auf Ja klicken, werden die berechneten Lösungen verworfen, und das Dialogfeld wird geschlossen. Wenn Sie auf Nein klicken, kehren Sie zum Dialogfeld GPS-Verarbeitung zurück.

  Wenn die GPS-Verarbeitung noch läuft, während Sie auf Abbrechen klicken, wird die Verarbeitung beendet, nachdem die Lösung für die gerade verarbeitete Basislinie berechnet wurde, und Sie werden aufgefordert, das Abbrechen zu bestätigen. Wenn Sie auf Ja klicken, werden die berechneten Lösungen verworfen, und das Dialogfeld wird geschlossen. Wenn Sie auf Nein klicken, kehren Sie zum Dialogfeld GPS-Verarbeitung zurück.

Bericht

Wählen Sie diese Schaltfläche, um den GPS-Basislinienverarbeitungsbericht für die ausgewählte Basislinie anzusehen. Sie müssen zuerst eine Basislinienlösung aus der GPS-Verarbeitungsliste wählen, bevor diese Schaltfläche zur Verfügung steht.

Doppelte Basislinienlösungen überschreiben

Diese Option legt fest, wie Basislinien nach einer Neuberechnung gespeichert werden. Das Kontrollkästchen ist gemäß Voreinstellung aktiviert. Das bedeutet, daß bestehende Basislinienlösungen überschrieben werden. Wenn das Kontrollkästchen deaktiviert ist, wird die neue Lösung im Projekt gespeichert, und die alte Lösung wird ebenfalls beibehalten. Die neue Lösung wird dabei zur aktiven Lösung, die alte Lösung wird inaktiv. Im Eigenschaftsfenster kann eine alte inaktive Lösung wieder als aktive Lösung gewählt werden.

Das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ gilt nur für Basislinien, die mehrfach berechnet wurden. Basislinien, die zwischen denselben Punkten zu einem anderen Zeitpunkt oder an einem anderen Tag aus GPS-Daten berechnet wurden, sind hiervon nicht betroffen. Trimble empfiehlt, alte Basislinienlösungen immer zu überschreiben.


    Den GPS-Basislinienverarbeitungsbericht verwenden

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Der GPS-Basislinienverarbeitungsbericht enthält detaillierte Informationen über Basislinienlösungen.

Führen Sie einen der nachfolgenden Schritte aus, um einen GPS-Verarbeitungsbericht zu erzeugen:

  Doppelklicken Sie auf eine Basislinie im Dialogfeld GPS-Verarbeitung.

  Wählen Sie eine Basislinie im Dialogfeld GPS-Verarbeitung, und klicken Sie auf Bericht.

  Wählen Sie eine Basislinie im Graphikfenster, und wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung.

Der GPS-Basislinienverarbeitungsbericht kann verwendet werden, um:

  die Details der Basislinienlösung zu überprüfen, die nicht in der einzeiligen Zusammenfassung der GPS-Verarbeitungsliste enthalten sind, z. B. Fehler in HoReHö (Hochwert-Rechtswert-Höhe) oder die Anzahl durchgeführter und zurückgewiesener Messungen.

  Vergleichen Sie die Standpunktinformationen der Lösung mit Ihren Feldnotizen. Achten Sie dabei vor allem auf:

  Standpunktnamen

  Antennenhöhen, -typen und -Meßmethoden

  Anfangs- und Endzeiten

  Prüfen Sie die Zusammenfassung der Satellitenphasenverfolgung an jedem Standpunkt auf Unterbrechungen oder Lücken im L1- und L2-Signal.

  Prüfen Sie die kombinierte Zusammenfassung der Satellitenphasenverfolgung. Die grau unterlegten Messungen wurden bei der Berechnung der Basislinienlösung verwendet.

  Prüfen Sie die Restwerte-Plots für jeden Satelliten. Sie enthalten den RMS für jeden Satelliten, der zur Berechnung der Basislinienlösung verwendet wurde.


    Verarbeitungsresultate speichern

Weitere Informationen

Dialogfeld	Siehe auch
Klicken Sie im Dialogfeld GPS-Verarbeitung auf die Schaltfläche Speichern, um die in der GPS-Verarbeitungsliste gewählten Basislinienlösungen im Projekt zu speichern. Eine Basislinie ist ausgewählt, wenn ein Häkchen in dem davorstehenden Kontrollkästchen erscheint.

Wenn neuberechnete Basislinienlösungen in Ihrer Verarbeitungssitzung enthalten sind, wird das Speichern dieser Lösungen durch das Kontrollkästchen Doppelte Basislinenlösungen überschreiben gesteuert. Diese Option legt fest, wie Basislinien nach einer Neuberechnung gespeichert werden. Das Kontrollkästchen ist gemäß Voreinstellung aktiviert. Das bedeutet, daß bestehende Basislinienlösungen überschrieben werden. Wenn das Kontrollkästchen deaktiviert ist, wird die neue Lösung im Projekt gespeichert, und die alte Lösung wird ebenfalls beibehalten. Die neue Lösung wird dabei zur aktiven Lösung, die alte Lösung wird inaktiv. Im Eigenschaftsfenster kann eine alte inaktive Lösung wieder als aktive Lösung gewählt werden.

Das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ gilt nur für Basislinien, die mehrfach berechnet wurden. Basislinien, die zwischen denselben Punkten zu einem anderen Zeitpunkt oder an einem anderen Tag aus GPS-Daten berechnet wurden, sind hiervon nicht betroffen. Trimble empfiehlt, alte Basislinienlösungen immer zu überschreiben.


     L1 Fixed

 Überblick und weitere Informationen

Für kurze Basislinien mit einer Länge von einigen Kilometern wird im letzten Durchgang anstelle einer Iono-frei Fixed-Lösung eine ‘Nur L1’-Lösung berechnet, wenn Zweifrequenzdaten zur Verarbeitung verwendet wurden. Bei dieser letzten ‘Nur L1’-Lösung werden die L1-Mehrdeutigkeiten anhand der Zweifrequenzdaten gelöst. Für Basislinien mit einer Länge von bis zu 5 km wird im allgemeinen eine L1 Fixed-Lösung bevorzugt, da das Datenrauschen in diesen Lösungen geringer ist.

Der Grenzwert für ‘Nur L1’-Lösungen kann im GPS-Verarbeitungsstil definiert werden.


    Iono-frei Fixed

 Überblick und weitere Informationen

Die Iono-freie Fixed-Lösung bietet in den meisten Fällen eine optimale Lösung. Diese Lösungen enthalten keine ionosphärischen Störungen, und gelöste Fixed-Mehrdeutigkeiten bieten die besten Gesamtergebnisse.

Eine Iono-freie Fixed-Lösung für kurze Basislinien kann jedoch eine schwache Lösung sein. Vermeiden Sie die Verwendung dieses Lösungstyps für kurze Basislinien. Die Trimble Geomatics Office Software erkennt kurze Basislinien automatisch und wählt den geeigneten endgültigen Lösungstyp.

Weitere Informationen finden Sie unter L1 Fixed.


    L1 Float

 Überblick und weitere Informationen

Bei der Verarbeitung von Einfrequenzdaten erzeugt das Basislinienverarbeitungsprogramm eine L1 Fixed-Lösung während des letzten Durchgangs, wenn die L1-Mehrdeutigkeiten erfolgreich gelöst werden konnten. Ist dies nicht der Fall, wird eine L1 Float-Lösung berechnet. Eine L1 Float-Lösung kann für kurze Basislinien berechnet werden, wenn die Besetzungszeiten nicht ausreichend waren oder das Datenrauschen in den Messungen zu hoch ist. Es kann äußerst schwierig sein, zuverlässige L1 Fixed-Lösungen für Basislinien von 10-15 km Länge zu erhalten, da Einfrequenz-Beobachtungen sehr anfällig für ionosphärische Verzögerungen sind.

L1 Float-Lösungen sind in der Regel schwächer als Fixed-Lösungen. Daher ist die Verwendung von L1 Float-Lösungen für Standardvermessungen nicht empfehlenswert. Sie sollten die Daten entweder neu berechnen oder die entsprechenden Basislinien erneut beobachten.

Das Basislinienverarbeitungsprogramm berechnet eine feste ganzzahlige Lösung auf der Grundlage des festgelegten Verhältnisgrenzwerts. Dieser Grenzwert wird vom Verarbeitungsprogramm intern auf 1,5 festgelegt. Liegt das berechnete Verhältnis unter diesem programminternen Grenzwert, werden Float-Lösungen erstellt.


    Iono-frei Float

 Überblick und weitere Informationen

Eine Iono-freie Float-Lösung für Basislinien von über 30 km Länge kann eine sehr gute Lösung sein, sollte jedoch immer überprüft werden. Für sehr lange Basislinien ist die Iono-freie Float-Lösung möglicherweise der beste Lösungstyp. Längere Besetzungszeiten tragen zu einer verbesserten Genauigkeit dieser Lösungen bei, da durch unverzerrte Iono-freie Beobachtungswerte eine Annäherung der Lösung an das korrekte geometrische Ergebnis erreicht werden kann. Bei der Besetzung langer Basislinien über einen Zeitraum von mehreren Stunden lassen sich mit Iono-frei Float-Lösungen exzellente Ergebnisse erzielen.

Wählen Sie für Basislinien von mehreren hundert bzw. mehreren tausend Kilometern Länge einen Float-Lösungstyp, um unter Verwendung von Zweifrequenzdaten eine iono-freie Float-Lösung zu erzeugen. Wie vorstehend beschrieben können bei der Besetzung sehr langer Basislinien über mehrere Stunden hervorragende iono-freie Float-Lösungen berechnet werden.

Der Grenzwert für Float-Lösungen sehr langer Basislinien kann mit Hilfe des GPS-Verarbeitungsstils festgelegt werden. Getrennte Einstellungen für Broadcast- und genaue Ephemeriden sind ebenfalls möglich.


GPS-Datenanalyse - Überblick
    GPS-Datenanalyse − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Die Bewertung der Meßqualität ist eine äußerst wichtige Aufgabe. Da bei der Beobachtungstechnik (der Aufzeichnung von Satellitenträgerphasendaten) selbst keine so greifbaren Ergebnisse erzielt werden, wie bei Strecken- und Winkelmessungen mit traditionellen Methoden, ist der Einsatz von Nachverarbeitungstechniken zur Bewertung der Resultate erforderlich. Es gibt einige Richtlinien, die, bei sorgfältiger Beachtung, zu besseren GPS-Vermessungsergebnissen führen.

Wenn die Verarbeitungsergebnisse schlechter ausfallen als erwartet, haben Sie verschiedene Möglichkeiten, die Qualität der Resultate zu verbessern, bevor Sie ins Feld zurückkehren und problematische Basislinien erneut besetzen müssen. Die im GPS-Basislinienverarbeitungsbericht enthaltenen Informationen können ein Indikator für Störungen im Satellitensignal sein. Aus diesen Daten können die Beobachtungszeiten entnommen werden, bei denen ein Signal gestört wurde. Der Bericht selbst ist nützlich, wenn Sie die Daten mit einem anderen GPS-Verarbeitungsstil neu berechnen und anschließend mit dem alten Bericht vergleichen möchten.

Potentielle Probleme

Schlechte GPS-Verarbeitungsergebnisse können unterschiedliche Ursachen haben, z. B.:

  grobe Fehler im Feld:

  unkorrekte Antennenhöhenmessungen

  falsche Standpunktbezeichnungen

  Stativ-Zentrierfehler

 Unterschiede bei den Empfängereinstellungen:

  Synchronisierungsraten

  aktivierte oder deaktivierte SVs

  unterschiedliche Datenformate

  Datenerfassung unter schlechten Bedingungen:

  eine zu geringe Anzahl beobachtbarer Satelliten

  ein hoher PDOP

  zu viele Satelliten mit zu geringer Höhe

  Mehrwegeausbreitung

  eine große Anzahl von Phasensprüngen

  ungenügende Besetzungszeiten

Die häufigsten potentiellen Fehlerquellen in der ersten Kategorie sind Bedienerfehler oder grobe Fehler im Feld. Sie können grobe Fehler durch gute Vermessungspraktiken auf ein Mindestmaß beschränken. So können z. B. Meßfehler vermieden werden, wenn die Antennenhöhe in Vermessungsfuß und Metern korrekt gemessen wird, und Anfang und Ende der Besetzungen aufgezeichnet werden. Ein Stativ mit fester Höhe kann benutzt werden, um Maßbandfehler und daraus entstehende Zahlendreher zu vermeiden. Eindeutige Feldnotizen über Standpunktnamen, Standorte, Beobachtungszeiten und Antennenhöhen können außerordentlich wichtig sein, wenn Fragen/Probleme bei der Datenverarbeitung auftauchen.

Potentielle Fehler der zweiten Kategorie sind möglicherweise nicht so einfach zu beheben. Idealerweise sollten bei einer GPS-Vermessung immer sechs Satelliten verfolgt werden. Der PDOP sollte möglichst gering sein. Die Sicht zum Himmel sollte frei und nicht durch Hindernisse (z. B. Bäume) versperrt sein. Es wäre jedoch unlogisch, zu erwarten, daß all diese Voraussetzungen immer gegeben sind. Deshalb müssen die tatsächlichen Bedingungen vor Ort bei der Auswahl und Formulierung der Feldmethode berücksichtigt werden.

Die Qualität verbessern

Es gibt eine Reihe von Schritten, mit denen Sie die Genauigkeit Ihrer Vermessungsergebnisse verbessern können. Beachten Sie folgende Richtlinien:

  Wählen Sie die bestmöglichen Bedingungen. Benutzen Sie QuickPlan, um Beobachtungszeiten mit gutem PDOP und einer ausreichenden Anzahl von Satelliten auszuwählen. Prüfen Sie auch den VDOP, um bestmögliche vertikale Ergebnisse zu erhalten.

  Achten Sie bei der Felderkundung auf Hindernisse und andere Objekte, die zu einer Mehrwegeausbreitung führen könnten. Ändern Sie (falls möglich) den Empfängerstandort, wenn Hindernisse im Feld vorhanden sind. Dies gilt vor allem für Basis-Stationen in kinematischen Vermessungen.

  Vergewissern Sie sich, daß die Einstellungen aller Empfänger, die in einer Vermessungssitzung verwendet werden, kompatibel sind.

  Wählen Sie Ihre Besetzungszeiten nach den Bedingungen vor Ort. Wenn Sie die erforderlichen Besetzungszeiten nicht genau kennen, verlängern Sie die Beobachtungszeit ein wenig, bis Sie mehr Erfahrung im Feld gesammelt haben. Achten Sie bei kinematischen Vermessungen besonders auf die Initialisierungen. Erhöhen Sie die Besetzungszeit für statische oder OTF-Initialisierungen geringfügig. Sind die Besetzungszeiten zu kurz, müssen Sie bestimmte Basislinien evtl. erneut beobachten.

  Eignen Sie sich eine gute Vermessungspraxis an. Führen Sie redundante Messungen durch. Beobachten Sie wichtige Basislinien in zwei unabhängigen Sitzungen. Gestalten Sie Ihren Netzentwurf so, daß mindestens drei unabhängige Basislinien von jedem Standpunkt aus beobachtet werden. Auf diese Weise können Sie Standpunktkoordinaten berechnen, ohne erneut ins Feld zurückkehren zu müssen, selbst wenn für eine dieser Basislinien keine Lösung berechnet werden kann.

  Bauen Sie Ihr Netz so auf, daß die Basislinien, die in einer oder in mehreren Sitzungen beobachtet werden, kleine geschlossene Figuren bilden. Nur so haben Schleifenschlüsse einen Sinn. Wenn alle Basislinien in einer Schleife in derselben Sitzung beobachtet wurden, können Standpunktfehler, die in allen in der Sitzung beobachteten Basislinien enthalten sind, nicht entdeckt werden.

  Bewerten Sie die vom Verarbeitungsprogramm berechneten Ergebnisse. Sie können anhand einfacher Richtlinien extreme Resultate erkennen und analysieren. (Auf die Bewertung der Verarbeitungsresultate wird später noch eingegangen.)

  Verwenden Sie das Netzausgleichungsmodul, wenn Sie es auf Ihrem Computer installiert haben. Sie wissen erst, ob Ihre Vermessungsarbeit beendet ist, wenn Sie alle Basislinien in einem Projekt gleichzeitig ausgeglichen haben. Eine Netzausgleichung ist die beste Methode, um grobe und systematische Fehler im Netz zu entdecken.

Anhand der vorstehend genannten Schritte und mit den Hilfsmitteln in der Trimble Geomatics Office Software (z. B. Neuberechnung, Schleifenschlüsse und dem optionalen Netzausgleichungsmodul) können Sie sicherstellen, daß Ihr Netz alle Projektanforderungen erfüllt.

Die folgenden Themen enthalten zusätzliche Anleitungen zur Verarbeitung, Überprüfung und Qualitätsverbesserung Ihrer GPS-Daten:

  GPS-Basislinienverarbeitungsbericht

  Problematische Basislinien erneut berechnen

  Daten in Timeline überprüfen

  Phasensprünge korrigieren

  Ungültige Entfernungsdaten korrigieren

  GPS-Beobachtungen deaktivieren

  Ausgewählte Satelliten deaktivieren


    Mehrwegeausbreitung

 Überblick und weitere Informationen

Durch Mehrwegeausbreitung wird der Weg eines GPS-Satellitensignals verlängert. Das Signal wird von bestimmten Oberflächen reflektiert, z. B. von:

  Wasserflächen

  Gebäuden

  Fahrzeugen

  Drahtzäunen

Mehrwegeausbreitungen treten vor allem in ländlichen Gebieten auf.

Im Restwerte-Plot werden Mehrwegeausbreitungen als Sinuskurve dargestellt. Die Größe der Sinuskurve hängt von der Stärke des Satellitensignals ab, und von der Wegstrecke, die das Signal von der Ausbreitungsquelle bis zum Antennenphasenzentrum zurücklegt. Mehrwegeausbreitungen sind in Daten, die über einen kurzen Zeitraum (z. B. 15 Minuten oder weniger) aufgezeichnet wurden, nur schwer zu erkennen. Wenn Sie davon ausgehen, daß es bei einer Vermessung zu Mehrwegeausbreitungen kommt, sollten Sie längere Besetzungszeiten einplanen. Wenn genügend Daten zur Verfügung stehen, kann das Verarbeitungsprogramm die Effekte der Mehrwegeausbreitung ausgleichen. Eine Antenne mit Grundplatte oder eine Choke-Ring Antenne können die Auswirkungen von Mehrwegeausbreitungen ebenfalls reduzieren.


Basislinien neu berechnen
     Basislinien erneut verarbeiten

Weitere Informationen

Wie kann ich ...	Siehe auch
Führen Sie die folgenden Schritte aus, um Basislinien neu zu berechnen:

1.	Wählen Sie den aktiven GPS-Verarbeitungsstil für die Neuberechnung.

2.	Führen Sie einen der nachfolgenden Schritte aus, um die zu verarbeitenden Basislinien mit Hilfe der Standardmethoden auszuwählen:

  Klicken Sie im Graphikfenster auf eine oder mehrere Basislinien

  Wählen / ‘Nach Abfrage’

  Vorherige Auswahlmenge

3.	Führen Sie einen der nachfolgenden Schritte aus, um das Verarbeitungsprogramm zu starten:

  Wählen Sie im Menü Vermessung die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Trimble Vermessung in der Projektleiste die Option GPS-Basislinien verarbeiten.

  Wählen Sie aus der Gruppe Verarbeiten in der Projektleiste die Option GPS-Basislinien verarbeiten.

Das Dialogfeld GPS-Verarbeitung erscheint, und das Basislinienverarbeitungsprogramm beginnt mit der Neuberechnung aller ausgewählten Basislinien. Verwenden Sie die GPS-Verarbeitungsliste, um die Verarbeitungsresultate zu überprüfen und zu entscheiden, ob Sie die neuen Ergebnisse beibehalten oder verwerfen möchten. Überprüfen Sie, ob das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben’ aktiviert ist, bevor Sie die neuen Resultate im Projekt speichern.

Das Kontrollkästchen Doppelte Basislinienlösungen überschreiben legt fest, wie Basislinien nach einer Neuberechnung gespeichert werden. Das Kontrollkästchen ist gemäß Voreinstellung aktiviert. Das bedeutet, daß bestehende Basislinienlösungen überschrieben werden. Wenn das Kontrollkästchen deaktiviert ist, wird die neue Lösung im Projekt gespeichert, und die alte Lösung wird ebenfalls beibehalten. Die neue Lösung wird dabei zur aktiven Lösung, die alte Lösung wird inaktiv. Im Eigenschaftsfenster kann eine alte inaktive Lösung wieder als aktive Lösung gewählt werden.

Das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ gilt nur für Basislinien, die mehrfach berechnet wurden. Basislinien, die zwischen denselben Punkten zu einem anderen Zeitpunkt oder an einem anderen Tag aus GPS-Daten berechnet wurden, sind hiervon nicht betroffen. Trimble empfiehlt, alte Basislinienlösungen immer zu überschreiben.


    Phasensprünge

 Überblick und weitere Informationen

Ein Phasensprung ist eine Unterbrechung bei der Verfolgung des Satellitensignals. Die Wellenlängen, die der Empfänger bei der kontinuierlichen Trägerphasenverfolgung zählt, werden auch als Zyklen bezeichnet. Wenn der Empfänger die Zählung nicht fortführen kann, weil er das Satellitensignal verloren hat, tritt ein Phasensprung bei der Zählung der Wellenlängen oder Zyklen auf. Ein Phasensprung führt dazu, daß die Trägerphase zurückgesetzt wird und der Empfänger erneut mit der Zählung beginnt. Dies ist nicht besonders schlimm, wenn das Basislinienverarbeitungsprogramm die Zählung anhand der durchgeführten Berechnung wieder herstellen kann.

Die Unterbrechung des Satellitensignals (stationär und beim Roving) kann verschiedene Ursachen haben. Ein stationärer Empfänger kann das Satellitensignal verlieren, wenn der Satellit niedrig über dem Horizont steht und nur ein schwaches Signal sendet. Ein Signalverlust kann auch durch Hindernisse, z. B. Bäume entstehen, die das Satellitensignal blockieren. Bei einem bewegten Empfänger gibt es weitere Möglichkeiten: er kann z. B. unter einer Brücke oder durch einen Tunnel bewegt werden, oder sich kurzzeitig unter einem Baum befinden. Manchmal genügt es bereits, eine Hand über die GPS-Antenne zu halten, um das Signal zu unterbrechen. Achten Sie auf solche Situationen, und vermeiden Sie sie, wenn möglich.


GPS-Basislinienverarbeitungsbericht - Verarbeitungszusammenfassung
    GPS-Basislinienverarbeitungsbericht − Verarbeitungszusammenfassung

In diesem Abschnitt des GPS-Basislinienverarbeitungsberichts können Sie schnell feststellen, welche Basislinien erfolgreich verarbeitet wurden und welche Basislinien überprüft werden müssen.

Führen Sie einen der folgenden Schritte aus, um auf die Verarbeitungszusammenfassung zuzugreifen:

  Doppelklicken Sie im Dialogfeld GPS-Verarbeitung auf eine einzeilige Lösungszusammenfassung.

  Wählen Sie eine oder mehrere Basislinien, und klicken Sie im Dialogfeld GPS-Verarbeitung auf Bericht.

  Wählen Sie im Graphikfenster Basislinien, und wählen Sie dann Berichte / Bericht GPS-Basislinienverarbeitung.

Folgende Informationen werden angezeigt:

Spalte	Was angezeigt wird
ID	Die Basislinien-ID.
Von	Der Name des Standpunkts, von dem die Beobachtung durchgeführt wurde.
Zu	Der Name des Standpunkts, zu dem die GPS-Beobachtung durchgeführt wurde.
Basislinienlänge	Die Länge der Basislinie zwischen den Von- und Zu-Standpunkten.
Lösungstyp	Der Lösungstyp. Die häufigsten Typen sind L1 Fixed-Lösungen für kurze Basislinien und iono-freie Fixed-Lösungen für Basislinien mittlerer Länge. Bei der Verarbeitung sehr langer Linien können iono-freie Float-Lösungen verwendet werden.
Verhältnis	Das Basislinienverarbeitungsprogramm vergleicht die beiden Lösungen mit der geringsten Varianz. Das Verhältnis ist die Varianz der zweitbesten Lösung dividiert durch die Varianz der bestmöglichen Lösung.   HINWEIS: Nur Fixed-Lösungen haben Verhältniswerte.
Referenzvarianz	Die Referenzvarianz ist eine einheitslose Kennzahl, die angibt, wie gut die beobachteten Daten zur Basislinienlösung passen.
RMS	Der RMS (Quadratischer Mittlerer Fehler). Der RMS gibt die Qualität der Lösung ausschließlich auf der Grundlage des in den Satellitenbeobachtungen gemessenen Rauschens an. Dieser Wert ist von der Satellitengeometrie unabhängig.


GPS Basislinenverarbeitungsbericht - Basislinienzusammenfassung
GPS-Basislinienverarbeitungsbericht − Basislinienzusammenfassung

Dieser Abschnitt des GPS-Basislinienverarbeitungsberichts enthält eine Zusammenfassung für eine bestimmte Basislinie. So überprüfen Sie diese Basislinie:

1.	Wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung. Der Basislinienverarbeitungsbericht erscheint.

2.	Wählen Sie die Basislinie aus der Verarbeitungszusammenfassung.

Folgende Informationen werden angezeigt:

Feld	Was angezeigt wird
Verarbeitet	Der Tag, das Datum und die Zeit, an der die Lösung verarbeitet wurde.
Lösungstyp	L1 Fixed-Lösungen sind die häufigsten Lösungen für kurze Basislinien und iono-freie Fixed-Lösungen für Basislinien mittlerer Länge. Bei der Verarbeitung sehr langer Basislinien können iono-freie Float-Lösungen verwendet werden.
Akzeptabilität der Lösung	Gibt an, ob die Lösung die im Dialogfeld GPS-Verarbeitung festgelegten Akzeptanzkriterien erfüllt.
Verwendete Ephemeriden	Gibt an, ob Broadcast- oder genaue Ephemeriden bei der Berechnung der Basislinienlösung verwendet wurden.
Met-Daten	Das verwendete meteorologische Modell.
Schrägstrecke Basislinie	Die Schrägstrecke der Basislinie.
Höhenmaske	Die bei der Verarbeitung festgelegte Höhenmaske. Dieser Wert wird im Dialogfeld GPS-Verarbeitungsstile festgelegt.
Varianzverhältnis	Das Basislinienverarbeitungsprogramm vergleicht die beiden Lösungen mit der geringsten Varianz. Das Verhältnis ist die Varianz der zweitbesten Lösungen dividiert durch die Varianz der bestmöglichen Lösung.  HINWEIS: Nur Fixed-Lösungen haben Verhältniswerte.
Varianz der Gewichtseinheit (Referenzvarianz)	Die Referenzvarianz ist eine einheitslose Kennzahl, die angibt, wie gut die beobachteten Daten zur Basislinienlösung passen.
RMS	Der RMS (Quadratischer Mittlerer Fehler). Der RMS gibt die Qualität der Lösung ausschließlich auf der Grundlage des in den Satellitenbeobachtungen gemessenen Rauschens an. Dieser Wert ist von der Satellitengeometrie unabhängig.
Horizontale Genauigkeit	Die horizontale Genauigkeit der Beobachtung.
Vertikale Genauigkeit	Die vertikale Genauigkeit der Beobachtung.
Startzeit (GPS-Zeit)	Die Startzeit der GPS-Beobachtung.
Stoppzeit (GPS-Zeit)	Die Stoppzeit der GPS-Beobachtung.
Besetzungszeit	Die Länge der Besetzung – der Zeitraum zwischen der Startzeit und der Stoppzeit der GPS-Beobachtung.


GPS-Basislinienverarbeitungsbericht – Basislinienkomponenten
GPS-Basislinienverarbeitungsbericht − Basislinienkomponenten

Dieser Abschnitt des GPS-Basislinienverarbeitungsberichts enthält die Koordinaten für die beiden Punkte, die bei der Besetzung beobachtet wurden. Die Basislinienkomponenten zwischen den beiden Punkten, die mittleren Fehler und die A-posteriori Kovarianzmatrix sind ebenfalls enthalten.

So greifen Sie auf den Abschnitt Basislinienkomponenten zu:

1.	Wählen Sie Berichte / Bericht GPS-Basislinienverarbietung. Der GPS-Basislinienverarbeitungsbericht erscheint.

2.	Wählen Sie die Basislinie aus der Verarbeitungszusammenfassung. Die Basislinienzusammenfassung erscheint.

3.	Wählen Sie im Inhaltsabschnitt die Option Basislinienkomponenten.

Die Koordinaten für jeden Punkt werden angezeigt: Gitter-, örtliche oder WGS-84 Koordinaten.

Folgende Felder sind in der Tabelle Basislinienkomponenten enthalten:

  Delta Hochwert, Delta Rechtswert und Delta Höhe

  Ell. Azimut vorw.

  Ell. Strecke

  Delta Ellips. Höhe

  Delta X, Delta Y und Delta Z

Folgende Felder sind in der Tabelle Mittlere Fehler enthalten:

  σ Hochwert, σ Rechtswert, σ Höhe

  σ Ell. Azimut vorw.

  σ Ell. Strecke

  σ Ellips. Höhe

  σX, σY, σZ

Die Kovarianzinformationen werden in der Tabelle A -posteriori Kovarianzmatrix angezeigt.


GPS-Basislinienverarbeitungsbericht - Besetzungen
GPS-Basislinienverarbeitungsbericht − Besetzungen

Dieser Abschnitt des Basislinienverarbeitungsberichts enthält Informationen über den GPS-Empfänger und die bei der Vermessung für die Punktbeobachtung verwendete Antenne.

So greifen Sie auf den Abschnitt Besetzungen zu:

1.	Wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung. Der GPS-Basislinienverarbeitungsbericht erscheint.

2.	Wählen Sie die Basislinien aus der Verarbeitungszusammenfassung. Die Basislinienzusammenfassung erscheint.

3. 	Wählen Sie im Inhaltsabschnitt die Option Besetzungen.

Folgende Informationen werden angezeigt:

Feld	Was angezeigt wird
Punktname	Die Namen der Punkte, die vom GPS-Empfänger besetzt wurden.
Datei	Die Dateinamen (.dat-Dateien), in denen die Daten der Von- und Zu-Punkte gespeichert wurden.
Empfängertyp	Die bei der Beobachtung verwendeten GPS-Empfängertypen.
Empfänger-Seriennummer	Die Seriennummer des GPS-Empfängers.
Antennentyp	Der Typ der GPS-Antenne.
Gemessen bis	Der Punkt auf der GPS-Antenne, zu dem die Höhenmessung der Antenne vorgenommen wurde.
Antennenhöhe	Die gemessene Höhe der GPS-Antenne und die Höhe der Antenne bis zum Antennenphasenzentrum (APC).  HINWEIS: Die Berechnung des APC-Werts ist vom Antennentyp abhängig.
Antennenmodell	Das Modell der GPS-Antenne.


GPS-Basislinienverarbeitungsbericht – Verarbeitungsstil
GPS-Basislinienverarbeitungsbericht − Verarbeitungsstil

Dieser Abschnitt des Basislinienverarbeitungsberichts enthält eine Zusammenfassung der für die Verarbeitung festgelegten Steuerungen. Diese Steuerungen werden im Dialogfeld GPS-Basislinienverarbeitungsstile festgelegt. Vergewissern Sie sich, daß die korrekten Einstellungen bei der GPS-Basislinienverarbeitung verwendet werden.

So greifen Sie auf den Abschnitt Verarbeitungsstil zu:

1.	Wählen Sie Berichte/ Bericth GPS-Basislinienverarbeitung. Der GPS-Basislinienverarbeitungsbericht erscheint.

2.	Wählen Sie die Basislinien aus der Verarbeitungszusammenfassung. Die Basislinienzusammenfassung erscheint.

3.	Wählen Sie im Inhaltsabschnitt die Option Verarbeitungsstil.

Folgende Felder werden angezeigt:

Abschnitt	Felder
Verarbeitungsstil − enthält den Namen des verwendeten Verarbeitungsstils.	Höhenmaske Ephemeriden Lösungstyp
Statisch − enthält die Steuerungen für die statsiche Verarbeitung.	Minimale Beobachtungszeit für Basislinie Maximale Basislinienlänge für Fixed-Lösung—enthält zwei Einstellungsoptionen,  eine für Broadcast- und eine für die Verwendung genauer Ephemeriden.
Kinematisch − enthält die Steuerungen für die kinematische Verarbeitung.	Minimale Referenzbeobachtungszeit  Minimale Beobachtungszeit für statische Initialisierung Minimales Initialisierungsverhältnis für bekannten Punkt Minimale OTF-Berechnungszeit
Global − enthält die globalen Einstellungen, die im Register Globale Einstellungen festgelegt wurden.	Frequenztyp Maximal behebb. Phasensprung (nur statische Verarbeitung) Maximale Iterationen (nur statische Verarbeitung) Maximales Zeitlimit für Ganzzahl-Suche (nur statische Verarbeitung)
Qualität	RMS-Akzeptanzkriterien Verhältnis-Akzeptanzkriterien Referenzvarianz-Akzeptanzkriterien Multiplikator bearbeiten
Tropo	Modell Minimales Zenit-Verzögerungsintervall Beobachtete Met-Daten verwenden
Iono	Durchgang zur Auflösung von Mehrdeutigkeiten (nur statische Verarbeitung) Letzter Durchgang
Ereignisse	Interpolationsmethode Anzahl einzufügender Punkte Maximale Anzahl fehlender Epochen Zeit-Offset HINWEIS: Sie können Ereignisdaten im  Eigenschaftsfenster ansehen.
OTF-Suche – enthält die Suchmethode für die On-The-Fly-Suche.


GPS-Basislinienverarbeitungsbericht – Zusammenfassungen der SV-Verfolgung am Standpunkt
    GPS-Basislinienverarbeitungsbericht − Verfolgungszusammenfassung

Der Basislinienverarbeitungsbericht enthält Zusammenfassungen der Satellitenverfolgung an jedem Standpunkt sowie eine kombierte Verfolgungszusammenfassung.

So greifen Sie auf den Abschnitt Verfolgungszusammenfassung zu:

1.	Wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung. Der GPS-Basislinienverarbeitungsbericht erscheint.

2.	Wählen Sie die Basislinie aus der Verarbeitungszusammenfassung. Die Basislinienzusammenfassung erscheint.

3. 	Wählen Sie im Inhaltsabschnitt die Option Verfolgungszusammenfassung.

Individuelle Punktzusammenfassungen

Diese Zusammenfassungen geben die Qualität der von jedem Satelliten empfangenen L1- und L2-Signale an.

Die Zusammenfassungen der SV-Verfolgung zeigen die Beständigkeit der Satellitenverfolgung sowohl an den Referenz- als auch an den Rover-Stationen an. Die kontinuierliche Verfolgung bei einer Beobachtungssitzung wird durch durchgehende, kontinuierliche Linien für jeden Satelliten an den einzelnen Standpunkten angezeigt.

Verwenden Sie diese Zusammenfassungen, um einen Eindruck von der Größe und Anzahl der aufgetretenen Phasensprünge (Verlust der Verbindung) zu erhalten. Lücken und Unterbrechnungen in den Daten weisen auf einen Verlust der Verbindung zu einem Satelliten hin. Kleine Striche zeigen an, wann der Empfänger das Satellitensignal nach einem Phasensprung wieder aufgenommen hat.

Kombinierte Zusammenfassung

Da für die Basislinienverarbeitung an jedem Standpunkt dieselben Satelliten verfolgt werden müssen, enthält der GPS-Basislinienverarbeitungsbericht ebenfalls einen Plot der kombinierten Verfolgung.

Die bei der Verarbeitung verwendeten Segmente werden durch graue Rahmen um das Signal angezeigt. Wenn es Lücken in den verarbeiteten Phasensegmenten gibt, hat das Basislinienverarbeitungsprogramm diese Segmente nicht zur Berechnung der Basislinie verwendet.


    GPS-Basislinienverarbeitungsbericht - Kontinuierliche kinematische Qualität

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch

Dieser Abschnitt ist nur nach der Verarbeitung kontinuierlicher kinematischer Daten im Bericht enthalten. Der Abschnitt Kontinuierliche kinematische Qualität enthält zwei Plots.

So greifen Sie auf die kontinuierlichen kinematischen Informationen zu:

1.	Wählen Sie Berichte / Bericht GPS-Basislinienverarbeitung. Der GPS-Basislinienverarbeitungsbericht erscheint.

2.	Wählen Sie die Basislinie aus der Verarbeitungszusammenfassung. Die Basislinienzusammenfassung erscheint.

3.	Wählen Sie im Inhaltsabschnitt die Option Kontinuierliche kinematische Qualität.

Der erste Plot ist ein Plot des RMS für jede kontinuierliche kinematische Basislinie, geplottet gegen die Zeit. Dieser Plot kann verwendet werden, um Zeiten, zu denen schlechte Ergebnisse vorhanden sein können, zu erkennen. Ein konstanter Anstieg des RMS kann ebenfalls andeuten, daß Probleme bei der Verarbeitung aufgetreten sind.

Der zweite Plot ist ein Plot des RDOP und der Anzahl der Satelliten im Besetzungszeitraum. Dieser Plot wird verwendet, um Zeiten mit einer schlechten Satellitengeometrie und möglicherweise schlechten Verarbeitungsergebnissen zu identifizieren.


GPS-Basislinienverarbeitungsbericht - Restwerte
    GPS-Basislinienverarbeitungsbericht − Restwerte

Die Restwerte-Plots sind eine graphische Darstellung der Beobachtungsrestwerte für alle in der Basislinienlösung verwendeten Satelliten.

Die Restwerte-Plots zeigen die Qualität der von jedem Satelliten empfangenen Daten an. Sie können diesen Plot verwenden, um ein Gefühl für die Größe des Rauschens in einer Lösung zu bekommen. Dieser Plot zeigt die Restwerte für jeden Satelliten für jeden Meßzyklus an. Verrauschte Daten eines Satelliten können den Empfang von Daten anderer Satelliten beeinflussen. Die Linien auf dem Diagramm sollten um Null angeordnet  sein. Die Größe des Rauschens in der Lösung wird dadurch angezeigt, wie weit ein Plot von Null abweicht.

Restwerte werden nicht für die Satelliten angezeigt, die vom Verarbeitungsprogramm als Basis für doppelte Differenzierung ausgewählt wurden. Bei langen Besetzungen kann das Basislinienverarbeitungsprogramm mehr als einen Satelliten dafür auswählen. Lücken im Restwerte-Plot bedeuten normalerweise, daß der Satellit für diesen Zeitraum als Basis für doppelte Differenzierung verwendet wurde.


Nur-L1-Lösungen und Iono-freie Lösungen – Ein Vergleich
    Nur-L1-Lösungen und Iono-freie Lösungen − Ein Vergleich

Die Iono-freie Fixed-Lösung bietet in den meisten Fällen eine optimale Lösung. Diese Lösungen enthalten keine ionosphärischen Störungen, und gelöste Fixed-Mehrdeutigkeiten bieten die besten Gesamtergebnisse.

Eine Iono-freie Fixed-Lösung für kurze Basislinien kann jedoch eine schwache Lösung sein. Vermeiden Sie die Verwendung dieses Lösungstyps für kurze Basislinien. Die Trimble Geomatics Office Software erkennt kurze Basislinien automatisch und wählt den geeigneten endgültigen Lösungstyp.

Eine Iono-freie Float-Lösung für Basislinien über 30 km Länge kann eine sehr gute Lösung sein, Sie sollten die Lösung jedoch überprüfen. Bei sehr langen Basislinien kann eine Iono-freie Float-Lösung die bestmögliche Lösung sein. Längere Besetzungszeiten führen zu besseren Iono-freien Float-Lösungen, da durch unverzerrte Iono-freie Beobachtungsdaten die Lösung gegen das korrekte geometrische Ergebnis konvergieren kann. Tatsächlich können mit Iono-freien Float-Lösungen für sehr lange Linien, die über einen Zeitraum von mehreren Stunden besetzt wurden, hervorragende Ergebnisse erzielt werden.

Für sehr kurze Basislinien (kürzer als 5 km), ist Nur-L1 als letzter Durchgang (abgeleitet von den Zweifrequenz-Mehrdeutigkeiten) normalerweise die endgültige Lösung; für sehr lange Basislinien (länger als 200 km mit Broadcast-Ephemeriden, 2000 km mit genauen Ephemeriden) kann Iono-frei Float als letzter Durchgang die endgültige Lösung sein, wie nachfolgend beschrieben:

Sehr kurze Basislinien

Für kurze Basislinien mit einer Länge von wenigen Kilometern wird Nur-L1 als letzter Durchgang anstelle von Iono-frei Fixed verwendet. Dieser letzte Nur-L1-Durchgang wird jedoch zur Auflösung der L1-Mehrdeutigkeiten unter Verwendung von Zweifrequenzdaten. Für Basislinien unter 5 km Länge ist die L1-Fixed-Lösung im allgemeinen vorzuziehen, da diese Lösung weniger Datenrauschen enthält.

Der Grenzwert für Nur-L1-Lösungen kann in den GPS-Verarbeitungsstilen eingestellt werden.

Sehr lange Basislinien

Wählen Sie für sehr lange Basislinien (mehrere hundert bis mehrere tausend Kilometer) einen Float-Lösungstyp, um eine Iono-freie Float-Lösung unter Verwendung von Zweifrequenzdaten zu erzeugen. Wie zuvor erwähnt, ergeben lange Besetzungszeiten auf sehr langen Linien hervorragende Iono-freie Float-Lösungen.

Der Grenzwert für sehr lange Basislinien kann in den GPS-Verarbeitungsstilen eingestellt werden. Getrennte Kriterien für die Verwendung von Broadcast- und genauen Ephemeriden können ebenfalls festgelegt werden.


    Float -Lösungen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch

Bei der Verarbeitung von Einfrequenzdaten erzeugt das Basislinienverarbeitungsprogramm eine L1 Fixed-Lösung während des letzten Durchgangs, wenn die L1-Mehrdeutigkeiten erfolgreich gelöst werden konnten. Ist dies nicht der Fall, wird eine L1 Float-Lösung berechnet. Eine L1 Float-Lösung kann für kurze Basislinien berechnet werden, wenn die Besetzungszeiten nicht ausreichend waren oder das Datenrauschen in den Messungen zu hoch ist. Es kann äußerst schwierig sein, zuverlässige L1 Fixed-Lösungen für Basislinien von 10-15 km Länge zu erhalten, da Einfrequenz-Beobachtungen sehr anfällig für ionosphärische Verzögerungen sind.

L1 Float-Lösungen sind in der Regel schwächer als Fixed-Lösungen. Daher ist die Verwendung von L1 Float-Lösungen für Standardvermessungen nicht empfehlenswert. Sie sollten die Daten entweder neu berechnen oder die entsprechenden Basislinien erneut beobachten.

Das Basislinienverarbeitungsprogramm berechnet eine feste ganzzahlige Lösung auf der Grundlage des festgelegten Verhältnisgrenzwerts. Dieser Grenzwert wird vom Verarbeitungsprogramm intern auf 1,5 festgelegt. Liegt das berechnete Verhältnis unter diesem programminternen Grenzwert, werden Float-Lösungen erstellt.


    Dialogfeld Einstellungen GPS-Basislinienverarbeitungsbericht

Weitere Informationen

Wie kann ich ...	Siehe auch
Verwenden Sie dieses Dialogfeld, um die Abschnitte auszuwählen, die im GPS-Basislinienverarbeitungsbericht enthalten sein sollen.

Führen Sie hierzu einen der folgenden Schritte aus:

  Wählen Sie Berichte / Einstellungen / Bericht GPS-Basislinienverarbeitung.

  Drücken Sie Alt+BEB.

Das Dialogfeld Einstellungen GPS-Basislinienverarbeitungsbericht erscheint.

Aktivieren oder deaktivieren Sie die entsprechenden Kontrollkästchen, abhängig davon, welche Abschnitte im Bericht enthalten sein sollen:

  Basislinienzusammenfassung

  Basislinienkomponenten

  Besetzungen

  Verarbeitungsstil

  Kombinierte Zusammenfassung der SV-Verfolgung

  Kontinuierliche kinematische Qualität

  Restwerte


    Trimble-Datenrekorder (*.dc)

Diese Dateien enthalten in der Regel Informationen, die bei Echtzeit-kinematischen (RTK) oder konventionellen Vermessungen aufgezeichnet wurden. Trimble Datenrekorder-Dateien können als Referenz für nachzuverarbeitende GPS-Messungen verwendet werden, wenn keine Funkverbindung möglich ist. In diesem Fall werden die Punktinformationen in der Datenrekorder-Datei gespeichert. Die GPS-Rohmessungen werden in der assoziierten .dat-Datei zur späteren Nachverarbeitung gespeichert. Die auf die Datenrekorder-Datei bezogenen GPS-Messungen werden vom Basislinienverarbeitungsprogramm der Trimble Geomatics Office Software zur Berechnung von Basislinien verwendet, die in Echtzeit nicht gelöst werden konnten.

Obwohl die GPS-Messungen in separaten .dat-Dateien gespeichert sind, können sie beim Importvorgang automatisch geladen werden. Sie müssen nicht als unabhängige Dateien geladen werden, da Referenzen in der Datenrekorder-Datei selbst existieren.

Datenrekorder-Dateien können Messungen enthalten, die bei verschiedenen Vermessungssitzungen aufgezeichnet wurden, wobei jede Datei mit einer anderen Vermessungsmethode erfaßt worden sein kann.


    Trimble-Empfänger (*.dat)

Diese Dateien enthalten die mit Trimble GPS-Empfängern durchgeführten Messungen. Die Dateien werden normalerweise auf der Speichererweiterungskarte des Empfängers oder eines Trimble-Datenrekorders gespeichert. Die Dateien werden vom Vermessungsgerät zur Nachverarbeitung in die Trimble Geomatics Office Software heruntergeladen. Das Basislinienverarbeitungsprogramm verwendet die in den Dateien enthaltenen Messungen zur Berechnung von Basislinien mit statischen, FastStatic- und kinematischen Verfahren.


    Empfänger anderer Hersteller (RINEX)

Weitere Informationen

 Siehe auch

Diese Dateien enthalten Messungen, die mit einem GPS-Empfänger durchgeführt wurden. Ihr Inhalt ist mit dem von .dat-Dateien vergleichbar, wird jedoch im Receiver INdependent EXchange (RINEX)-Format gespeichert. Das RINEX-Format ist eine ASCII-Darstellung der erfaßten GPS-Daten. RINEX-Dateien enthalten Beobachtungs-, Navigations- und meteorologische Daten.

RINEX-Dateien werden normalerweise an Basisstationen aufgezeichnet, z. B. in den Vereinigten Staaten mit dem IGS Tracking Network, den Continuously Operating Reference Stations (CORS) oder mit Software anderer Hersteller. Das Verarbeitungsprogramm verwendet diese Dateien, ebenso wie .dat-Dateien, zur Berechnung von Basislinienlösungen.


    Statische/FastStatic GPS-Daten

Weitere Informationen

 Siehe auch

Bei der Datenerfassung in einer statischen Vermessungssitzung und einer FastStatic-Vermessung bestehen folgende Unterschiede.

Bei einer Statischen Vermessung:

  verbleibt der Empfänger stationär über einem einzigen Punkt

  werden Daten über einen längeren Zeitraum erfaßt, als bei einer FastStatic-Vermessung.

Bei einer FastStatic-Vermessung:

  wird der Empfänger zu mehreren Punkten bewegt und muß zur Datenerfassung stationär über jedem Punkt verbleiben

  zeichnet der Empfänger keine Daten auf, während er von Punkt zu Punkt bewegt wird und

  werden Daten über einen kürzeren Zeitraum erfaßt, als bei einer statischen Vermessung

Der wichtigste Unterschied zwischen einer statischen und einer FastStatic-Vermessung ist die Besetzungszeit - der Mindestzeitraum in dem ein Empfänger Daten erfasst. Die Besetzungszeit ist abhängig von der Anwendung, der Länge der Basislinie und vom verwendeten Empfängertyp (Ein- oder Zweifrequenz-Empfänger).

Besetzungszeiten für statische Vermessungen können bei Messungen, für die höchste Genauigkeit und Wiederholbarkeit erforderlich sind, 30 Minuten, mehrere Stunden oder sogar länger dauern. FastStatic-Besetzungszeiten für Zweifrequenz-Empfänger betragen etwa 8 Minuten. Abhängig von den Bedingungen vor Ort können jedoch auch längere Besetzungszeiten erforderlich sein.

Im allgemeinen sind für längere Basislinien auch längere Besetzungszeiten erforderlich. Je länger die Besetzungszeit ist, um so besser ist die Qualität der berechneten Ergebnisse. Die Zeit, die ein Empfänger stationär über einem Punkt verbleiben muß, hängt von der Satellitenkonstellation ab. Je größer die Anzahl der beobachtbaren Satelliten, desto kürzer ist die Besetzungszeit. Besetzungszeiten sind darüber hinaus von der Länge der beobachteten Basislinie abhängig. Für längere Basislinien sind, unabhängig von der Satellitenkonstellation, in der Regel ebenfalls längere Besetzungszeiten erforderlich.

Statische und FastStatic-Vermessungen bieten die bestmögliche GPS-Genauigkeit. Sie erhalten normalerweise die besten Resultate, wenn Sie sich im voraus dafür entscheiden, eine Kombination aus statischen und FastStatic-Sitzungen zu verwenden.


    Kinematische Daten

Weitere Informationen

 Siehe auch

Der Unterschied zwischen kinematischen Vermessungssitzungen und statischen oder FastStatic-Vermessungen besteht darin, daß der Empfänger bei kinematischen Vermessungen während der Datenerfassung bewegt wird und nicht stationär über einem Punkt verbleibt.

Ein weiterer wichtiger Unterschied zwischen kinematischen und statischen/FastStatic-Vermessungsmethoden ist die Besetzungszeit. Bei kinematischen Vermessungen ist die Standpunktbesetzung (nach der Initialisierung) sehr kurz. Sie kann, je nach Anwendung, Minuten oder sogar nur Sekunden dauern. Dies ermöglicht sehr produktive Vermessungen, eine große Anzahl von Daten kann in sehr kurzer Zeit aufgezeichnet werden.

Diese Produktivität hat jedoch auch ihre Nachteile: die erzielten Genauigkeiten sind geringer als bei statischen und FastStatic-Methoden. Kürzere Besetzungszeiten sind wegen der kleineren Datenmenge ebenfalls anfälliger für Mehrwegeausbreitung. Aufgrund der geringeren Genauigkeit kinematischer Vermessungen wird diese Methode nur für GPS-Messungen verwendet, für die keine bestmögliche Genauigkeit erforderlich ist.

Bei kinematischen Vermessungen muß bei der Satellitenverfolgung eine Initialisierung zur Lösung der im GPS-Signal enthaltenen unbekannten ganzzahligen Mehrdeutigkeiten durchgeführt werden. Die Mehrdeutigkeiten müssen während der Verarbeitung gelöst werden, damit Vermessungsergebnisse mit hoher Genauigkeit erzielt werden können.

Nach durchgeführter Initialisierung können kurze Besetzungszeiten für Punktmessungen verwendet werden. Die Trimble Geomatics Office Software kann die Initialisierung auf nachfolgende Lösungen anwenden. Aus diesem Grund ist nach der Initialisierung nur eine kurze Besetzungszeit erforderlich, bei der genügend Daten für die neue Position gesammelt werden können.

Es gibt vier Initialisierungstypen:

  Bekannter Punkt

  Statisch

  Nachverarbeitet On-The-Fly (OTF)

  Neubesetzung


    Statische Initialisierung

Weitere Informationen

 Siehe auch

Bei der statischen Initialisierung muß der Basis-Empfänger über einem bekannten Punkt aufgestellt werden, während der Rover einen anderen Punkt besetzt. Der Rover verbleibt für den Zeitraum einer normalen FastStatic-Besetzung stationär über dem Punkt. Die Besetzungszeit variiert in Abhängigkeit von der Anzahl der verfügbaren Satelliten und den bei der Vermessung verwendeten Empfängertypen. Richten Sie sich nach den empfohlenen Zeiten für FastStatic-Besetzungen, und berücksichtigen Sie auch Ihre eigenen Erfahrungen mit der Satellitenverfügbarkeit und den Bedingungen vor Ort.


    Initialisierung über einem bekannten Punkt

Weitere Informationen

 Siehe auch

Die Initialisierung über einem bekannten Punkt ist die schnellste und zuverlässigste Initialisierungsmethode. Sowohl der Basis-Empfänger als auch der Rover werden über bekannten oder bereits vermessenen Punkten aufgestellt. Der Rover verbleibt für mindestens 30 Sekunden stationär über dem Punkt. Das Basislinienverarbeitungsprogramm verwendet die bekannten Koordinaten während der Initialisierung als zusätzliche Informationen.


    Nachverarbeitete On-The-Fly (OTF) Initialisierung

Weitere Informationen

 Siehe auch

Für eine OTF-Initialisierung müssen mindestens 5 Satelliten verfolgt werden. Der Basis-Empfänger wird über einem bekannten Punkt aufgestellt und zeichnet GPS-Messungen auf. Der bewegte Empfänger erfaßt im selben Zeitraum ebenfalls Daten. Es ist nicht erforderlich, daß sich der Rover für einen bestimmten Zeitraum stationär über einem Punkt befindet. Das Basislinienverarbeitungsprogramm kann die Daten selbst dann zur Initialisierung verwenden, wenn der Rover während der gesamten Datenerfassung bewegt wurde.


    Initialisierung durch Neubesetzung

Weitere Informationen

 Siehe auch

Eine Initialisierung durch Neubesetzung ist mit der Initialisierung über einem bekannten Punkt vergleichbar, allerdings ist der vom Rover besetzte Punkt nicht im Voraus bekannt. Stattdessen besetzt der Rover einen Punkt, der zuvor während der kinematischen Feldsitzung beobachtet wurde. Man geht dabei von der Annahme aus, daß das Basislinienverarbeitungsprogramm die zuvor beobachtete Basislinie von der Basis zum Rover berechnen kann. Wenn sich diese Annahme bewahrheitet, kann die vorherige Basislinienlösung später zur Initialisierung verwendet werden. Der Rover sollte mindestens 30 Sekunden stationär über dem zuvor beobachteten Punkt verbleiben.


    Roving und kontinuierliche kinematische Daten

Weitere Informationen

 Siehe auch

Bei einer kontinuierlichen kinematischen Vermessung können folgende Vorgänge durchgeführt werden:

  Topographische Merkmale, z. B. Profile, Querprofile und Höhenlinien, können kartiert werden.

  Der Weg von sich bewegenden Fahrzeugen, z. B. von Flugzeugen oder Booten, kann kartiert werden. Darüber hinaus können die Koordinaten für bestimmte Ereigniszeitpunkte, z. B. für das Öffnen eines Kameraverschlusses, aufgezeichnet werden. Ereignisse werden im Empfänger erzeugt, indem ein Signal zum Empfänger-Ereignisport gesendet wird. Dieses Signal löst die Speicherung einer Ereignismarkierung aus.

Für kontinuierliche kinematische Vermessungen gelten dieselben allgemeinen Beschränkungen wie für kinematische Stop&Go Vermessungen. Bei kontinuierlichen kinematischen Vermessungen kann das Basislinienverarbeitungsprogramm nicht nur die Empfängerposition bestimmen, wenn der Empfänger stationär ist, sondern auch Lösungen für GPS-Beobachtungen berechnen, bei denen der Empfänger bewegt wurde. Mit dieser Methode können z. B. Geländevermessungen durchgeführt werden, bei denen Daten kontinuierlich in einem bestimmten Projektbereich aufgezeichnet werden. Antennenhöhenmessungen und etwaige Änderungen müssen dabei besonders berücksichtigt werden.

Da man bei kontinuierlichen kinematischen Vermessungen eine Empfängerposition für jede Epoche erhält, kann dieses Verfahren ebenfalls zur Bestimmung von Positionslösungen an einem bestimmten Ereigniszeitpunkt genutzt werden, z. B. beim Speichern einer Ereignismarkierung. Dafür verwendet das Verarbeitungsprogramm eine oder mehrere Positionen, die vor und nach dem aufgezeichneten Ereignis erfasst wurden. Das Programm benutzt eine Interpolationsstrategie, um die Position des Empfängers zum tatsächlichen Ereigniszeitpunkt zu bestimmen. GPS-Verarbeitungsstile können zur Steuerung von Ereignisinterpolationen verwendet werden. Folgende Steuerungen stehen zur Verfügung:

  Interpolationsmethode

  Maximal zulässige fehlende Epochen

  Zeit-Offset

HINWEIS: Das Basislinienverarbeitungsprogramm ordnet allen aufgezeichneten kontinuierlichen kinematischen Punkten automatisch Punktnamen zu, ohne daß es dabei zu Namenskonflikten mit Punkten aus kontinuierlichen RTK-Vermessungen kommt.


     Befehl Neuer Plot (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um ein neues SV-Plot Fenster zu öffnen. Es können mehrere SV-Plot Fenster geöffnet werden, nebeneinander oder überlappend. Individuelle SV-Plot-Fenster können auf Symbolgröße verkleinert und die Symbole innerhalb der SV-Plot-Anwendung angeordnet werden.

Führen Sie einen der nachfolgenden Schritte im Fenster GPS-Signal-Plots aus, um darauf zuzugreifen:

  Wählen Sie Datei / Neuer Plot.

  Klicken Sie in der SV-Plot Symbolleiste auf die Schaltfläche [image].

Ein neues Anwendungsfenster erscheint. Sie können es verwenden, um zusätzliche Plots anzuzeigen.


     Befehl Exportieren (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um SV-Verfolgungsrohdaten für den aktiven Plot in eine Datei zu exportieren. Die Datentabelle in der Datei enthält eine Spalte für jeden Typ von SV-Verfolgungsinformationen, die im aktiven Plot enthalten sind.

Führen Sie einen der nachfolgenden Schritte im Fenster GPS-Signal-Plots aus, um darauf zuzugreifen:

  Wählen Sie Datei / Exportieren.

  Klicken Sie in der SV-Plot Symbolleiste auf die Schaltfläche [image].

Exportierte SV-Plot-Dateien werden als Textdateien (*.txt-Dateien) gespeichert.


     Befehl Drucken (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um den Plot im gerade gewählten SV-Plot Fenster zu drucken. Der Plot kann auf einem Drucker oder in eine Datei ausgegeben werden, abhängig von den im Dialogfeld Drucken gewählten Optionen.

Führen Sie einen der nachfolgenden Schritte im Fenster GPS-Signal-Plots aus, um darauf zuzugreifen:

  Wählen Sie Datei / Drucken.

  Klicken Sie in der SV-Plot Symbolleiste auf die Schaltfläche [image].

Das Dialogfeld Drucken erscheint. Es enthält die Druckoptionen.

Folgende Optionen stehen zur Verfügung:

  Sie können OK wählen, um die Plots im aktiven Fenster sofort im Hochformat zu drucken.

  Wählen Sie die Option Querformat, um den Plot auf der gedruckten Seite um 90° zu drehen.

  Wählen Sie die Option Ausdruck in Datei, um die Plots im aktiven Fenster in eine Druckdatei auszugeben. Wenn Sie die Option Ausdruck in Datei wählen und auf OK klicken, erscheint ein Dialogfeld, das nach dem Dateinamen fragt.

  Sie können auch die Satellitenrohdaten, die zur Erzeugung des Plots verwendet wurden, mit dem Befehl Exportieren in eine Datei schreiben. Dies ist hilfreich, um die SV-Verfolgungsrohdaten in tabellarischer Form zu dokumentieren. Sie können später die exportierten tabellarischen Informationen und die Plots in Berichten zusammenstellen.


     Befehl Hilfe SV-Plot (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um Hilfe-Informationen zu den Befehlen und Bedienvorgängen des SV-Plots anzuzeigen.

Führen Sie einen der nachfolgenden Schritte im Fenster GPS-Signal-Plots aus, um darauf zuzugreifen:

  Wählen Sie Hilfe / Hilfe SV-Plot.

  Klicken Sie in der SV-Plot Symbolleiste auf die Schaltfläche [image].

Die SV-Plot Hilfe erscheint.


     Befehl L1 S-Bereich (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um stationäre L1-Bereichsdaten (in Metern) für die ausgewählten Satelliten über die Dauer der Timeline zu plotten.

Führen Sie einen der nachfolgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Daten / L1 S-Bereich.

  Klicken Sie in der Dialogleiste auf L1 S-Bereich.

Die stationären L1-Bereichsinformationen werden im aktiven Fenster geplottet.


     Befehl Azimut (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um die Azimutdaten (in Grad) zu plotten, die für den ausgewählten Satelliten über die Dauer der Timeline aufgezeichnet wurden.

Führen Sie einen der nachfolgenden Schritte aus, um den Azimutplot anzuzeigen:

  Wählen Sie Ansicht / Daten / Azimut.

  Klicken Sie in der Dialogleiste auf Azimut.


     Befehl Höhe (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um Satellitenrohdaten mit Höheninformationen zu plotten. Die Daten werden in Grad über der Dauer der Timeline geplottet.

Führen Sie einen der nachfolgenden Schritte aus, um den Höhenplot anzuzeigen:

  Wählen Sie Ansicht / Daten / Höhe.

  Klicken Sie in der Dialogleiste auf Höhe.

Die Höhendaten werden im aktiven Fenster geplottet.


     Befehl L1 SNR (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um das Signal-Rausch-Verhältnis der L1-Trägerphasendaten zu plotten, das für die Satelliten über die Dauer der Timeline aufgezeichnet wurde.

Führen Sie einen der nachfolgenden Schritte aus, um den L1-SNR-Plot anzuzeigen:

  Wählen Sie Ansicht / Daten / L1 SNR.

  Klicken Sie in der Dialogleiste auf L1 SNR.

Die L1-Signal-Rausch-Verhältnis-Informationen werden im aktiven Fenster geplottet.


     Befehl L2 SNR (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um das Signal-Rausch-Verhältnis der L2-Trägerphasendaten zu plotten, das für die Satelliten über die Dauer der Timeline aufgezeichnet wurde.

Fführen Sie einen der nachfolgenden Schritte im Fenster GPS-Signal-Plots aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Daten / L2 SNR.

  Klicken Sie in der Dialogleiste auf L2 SNR.

Die L2-Signal-Rausch-Verhältnis-Informationen werden im aktiven Fenster geplottet.


     Befehl L1-Phase (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um die L1-Trägerphasendaten zu plotten, die für den ausgewählten Satelliten über die Dauer der Timeline aufgezeichnet wurden.

Führen Sie einen der nachfolgenden Schritte aus, um den L1-Phasen-Plot anzuzeigen:

  Wählen Sie Ansicht / Daten / L1-Phase.

  Klicken Sie in der Dialogleiste auf L1-Phase.

Die L1-Phasen-Informationen werden im aktiven Fenster geplottet.


     Befehl L2-Phase (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch
Wählen Sie diesen Befehl, um die L2-Trägerphasendaten zu plotten, die für den ausgewählten Satelliten über die Dauer der Timeline aufgezeichnet wurden.

Führen Sie einen der nachfolgenden Schritte aus, um den L2-Phasen-Plot anzuzeigen:

  Wählen Sie Ansicht / Daten / L2-Phase.

  Klicken Sie in der Dialogleiste auf L2-Phase.

Die L2-Phasen-Informationen werden im aktiven Fenster geplottet.


     Befehl L1 Doppler (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um die L1-Trägerphasen-Dopplerdaten (in kHz) anzuzeigen, die für den ausgewählten Satelliten über die Dauer der Timeline aufgezeichnet wurden.

Der L1 Doppler ist das offensichtliche Trägersignalfrequenz-Offset, gemittelt über ein Stichproben-Meßintervall. Die Daten werden in Bezug auf die nominale L1-Trägerphase von 1575,42 MHz gemessen, referenziert auf den internen Takt des Empfängers. Der L1 Doppler enthält alle Taktfrequenzfehler von Empfängern und Satelliten. Er wird in Hertz bei der L1-Trägerphase ausgegeben.

Führen Sie einen der nachfolgenden Schritte aus, um den L1-Doppler-Plot anzuzeigen:

  Wählen Sie Ansicht / Daten / L1 Doppler.

  Klicken Sie in der Dialogleiste auf L1 Doppler.

Die L1-Doppler-Informationen werden im aktiven Fenster geplottet.


     Befehl L1 Aux CA (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um die L1-Auxiliary-C/A-Code-Informationen zu plotten, die für den ausgewählten Satelliten über die Dauer der Timeline aufgezeichnet wurden. Die Menüoptionen und die Befehlsschaltflächen auf der Dialogleiste sind nicht verfügbar, wenn keine L1-Auxiliary-C/A-Informationen für den Satelliten aufgezeichnet wurden. Diese Informationen sind nur für Empfänger verfügbar, die sowohl L1-C/A-Code als auch L1-P-Code gleichzeitig aufzeichnen können.

Fführen Sie einen der nachfolgenden Schritte aus, um L1-Auxiliary-C/A-Code-Informationen anzuzeigen:

  Wählen Sie Ansicht / Daten / L1 Aux CA.

  Klicken Sie in der Dialogleiste auf L1 Aux CA.

Die L1-Auxiliary-C/A-Informationen werden im aktiven Fenster geplottet.


     Befehl Uhrfehler (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um Uhrfehler-Informationen (in Millisekunden) über die Dauer der Timeline zu plotten.

Führen Sie einen der nachfolgenden Schritte aus, um den Uhrfehler-Plot anzuzeigen:

  Wählen Sie Ansicht / Daten / Uhrfehler.

  Klicken Sie in der Dialogleiste auf Uhrfehler.

Die Uhrfehlerdaten werden im aktiven Fenster geplottet.


     Befehl Dialogleiste (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um die Dialogleiste ein- und auszublenden. Die Dialogleiste enthält alle Befehle für das Plotten von SV-Verfolgungsrohdaten.

So blenden Sie die Dialogleiste ein- oder aus:

  Wählen Sie Ansicht / Dialogleiste.

  Drücken Sie Alt+AD.

Folgende Schaltflächen sind auf der Dialogleiste verfügbar:

  L1 S-Bereich

  Azimut

  Höhe

  L1 SNR

  L2 SNR

  L1-Phase

  L2-Phase

  L1 Doppler

  L1 Aux CA

  Uhrfehler

HINWEIS:  Diese Schaltflächen sind dieselben wie im Menü SV-Plot.

TIP: Sie können die Dialogleiste verankern und verschieben. Die Dialogleiste kann neben der SV-Plot-Symbolleiste oder im Bereich unterhalb der Statusleiste verankert werden


     Befehl Symbolleiste (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um die SV-Plot-Symbolleiste ein- oder auszublenden.

So blenden Sie die SV-Plot-Symbolleiste ein- oder aus:

  Wählen Sie Ansicht / Symbolleiste.

  Drücken Sie Alt+AS.

Bei jeder Ausführung des Befehls wird die Symbolleiste ein- oder ausgeblendet.


     Befehl Daten (SV-Plot)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl, um ein Untermenü mit Plot-Befehlen anzuzeigen. Individuelle Befehle plotten bestimmte Arten von SV-Verfolgungsrohdaten.

So greifen Sie auf das Untermenü zu:

  Wählen Sie Ansicht / Daten

Ein Untermenü mit folgenden Befehlen erscheint:

  L1 S-Bereich

  Azimut

  Höhe

  L1 SNR

  L2 SNR

  L1-Phase

  L2-Phase

  L1 Doppler

  L1 Aux CA

  Uhrfehler

HINWEIS: Diese Schaltflächen sind dieselben wie in der Dialogleiste SV-Plot.


     Befehl Beenden (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um die SV-Plot-Ansicht zu beenden.

So greifen Sie darauf zu:

  Wählen Sie Datei / Beenden.

Der SV-Plot wird geschlossen.


     Befehl Hilfe benutzen (SV-Plot)

Weitere Informationen

 Siehe auch

Wählen Sie diesen Befehl, um das Windows Hilfe-System über die Benutzung der Hilfe anzuzeigen.

Führen Sie dazu einen der nachfolgenden Schritte aus:

  Wählen Sie Hilfe / Hilfe benutzen.

Das Windows Hilfe-System über die Benutzung der Hilfe erscheint.


     Befehl Index (SV-Plot)

Wählen Sie diesen Befehl, um das Hilfe-System der Trimble Geomatics Office-Software zu starten.

Führen Sie einen der nachfolgenden Schritte aus, um die Trimble Geomatics Office-Hilfe aufzurufen:

  Wählen Sie Hilfe / Index.

Das erste Thema des Hilfe-Systems erscheint.


    Plots drucken

Die graphische Darstellung Bild eines Plots kann auf einem Drucker oder in eine Datei ausgegeben werden.

Standardmäßig werden Plots im Hochformat ausgegeben. Sie können die Option Querformat im Dialogfeld Druckereinstellungen wählen, um die Plots um 90° zu drehen.

TIP: Sie können auch die einem Plot zugeordneten SV-Verfolgungsdaten in eine Datei exportieren, die Datei mit einem Texteditor öffnen und die Daten drucken. Dies kann zur Dokumentation ausgedruckter Plots hilfreich sein.


     Plotdaten exportieren

Sätze geplotteter SV-Verfolgungsdaten können in einem Plotfenster dargestellt und in eine Datei exportiert werden.

Im folgenden wird ein Auszug der ersten Zeilen einer Datei mit L1- und L2-Signal-Rausch-Verhältnis-Plotdaten dargestellt:

Timeline Satellitendaten-Export für Satellit SV 1 in Datei 29932370.DAT

Zeit                       	       L1 S/N   L2 S/N

14:05:25.0  1998/09/10       52.75     38.00

14:05:30.0  1998/09/10       52.25     38.50

HINWEIS: Zusätzliche Spalten werden zu exportierten Dateien hinzugefügt, wenn mehrere Datentypen im selben Plotfenster enthalten sind.


     Plots analysieren

Weiterer Informationen

 Siehe auch

Plots der SV-Verfolgung, die in einem oder mehreren SV-Plot-Fenstern angezeigt werden, können visuell auf Unstimmigkeiten analysiert werden. Dies ist hilfreich, um Probleme zu identifizieren, die der Empfänger bei der Verfolgung eines oder mehrerer Satelliten gehabt haben kann. In einigen Fällen kann es helfen, alle oder Teile von Messungen eines oder mehrerer Satelliten zu deaktivieren.


     SV-Plots anzeigen

Weitere Informationen

 Siehe auch

Plots aufgezeichneter SV-Verfolgungsdaten können mit Hilfe der Befehle im Menü oder der Dialogleiste angezeigt werden.

Sie können folgendes tun, um Plots anzuzeigen:

  Mehrere Typen aufgezeichneter SV-Verfolgungsdaten im selben Fenster anzeigen.

  Mehrere Fenster öffnen, jedes mit einem oder mehreren Typen  aufgezeichneter SV-Verfolgungsdaten.

  Verwenden Sie die Maus, um auf Datenbereiche des Plots zu zeigen, und lesen Sie die Anzeigen in der Statusleiste ab, um sich über die Werte und Erfassungszeiten der Daten zu informieren.

  Zwei oder mehrere Typen aufgezeichneter SV-Verfolgungsdaten visuell analysieren, um nach Unstimmigkeiten zu suchen.

  Fenster neben- und hintereinander anordnen.

  Fenster minimieren und maximieren.

  Minimierte Fenster-Symbole anordnen.

  Die Größe von Fenstern ändern, deren ursprünglichen Zustand wiederherstellen oder die Fenster mit Standard-Windows-Befehlen verschieben.

  Anwendungsfenster jederzeit schließen.

  SV-Plot Fenster minimieren oder maximieren. Wenn das Fenster minimiert ist, erscheint das Symbol in der Windows-Taskleiste.


SV-Plot - Überblick
     SV-Plot − Überblick

Sehen Sie sich den SV-Plot an, um SV-Verfolgungsrohdaten zu analysieren, die für einen Satelliten in der Timeline aufgezeichnet wurden.

Das Anwendungsfenster kann wie jede Windows-Anwendung minimiert, maximiert und geschlossen werden. Im minimierten Zustand erscheint das Symbol SV-Plot in der Taskleiste von Windows.

Sie können einen oder mehrere Typen von SV-Verfolgungsrohdaten gleichzeitig in das Fenster plotten und diese Plots als Diagnosewerkzeug zur Analyse der während der Beobachtungszeiträume aufgezeichneten Satellitenrohdaten verwenden.

Die Plots sind aktiv, wenn Daten angezeigt werden. Sie können die Maus über die Plots bewegen und Wert und Aufzeichnungszeit der Daten ablesen. Die Position des Mauszeigers, während er über den Plot bewegt wird, bestimmt den Inhalt der Anzeigebereiche in der Statusleiste.

Weitere Informationen über den SV-Plot finden Sie unter folgenden Themen:

  Fenster SV-Plot

  Befehle SV-Plot

Folgende Vorgänge können während der Arbeit mit SV-Plot-Fenstern ausgeführt werden:

  Plots anzeigen

  Plots analysieren

  Plot-Daten exportieren

  Plots drucken


Befehle SV-Plot - Überblick
     Befehle SV-Plot − Überblick

Alle SV-Plot Befehle können vom Menü aus aufgerufen werden. Einige Befehle sind auch in der Symbolleiste und Dialogleiste zugänglich. Viele Befehle haben Zugriffstasten (Tastaturbefehle).

Folgende Befehle sind im Fenster GPS-Signal-Plots verfügbar:

Datei-Befehle

  Neuer Plot

  Exportieren

  Drucken

  Druckereinrichtung

  Beenden

Ansichts-Befehle

  Daten

  Symbolleiste

  Dialogleiste

Fenster-Befehle

  Überlappend

  Nebeneinander

  Symbole anordnen

Hilfe-Befehle

  Hilfe SV-Plot

  Index

  Hilfe benutzen

  Timeline


Fenster SV-Plot - Überblick
     Fenster SV-Plot − Überblick

Weitere Informationen

Dialogfeld	Siehe auch
Überblick

Verwenden Sie dieses Fenster, um SV-Verfolgungsrohdaten zu plotten und visuell zu analysieren, die über den Beobachtungszeitraum für den gewählten Satelliten und die aktive Vermessung aufgezeichnet wurden. Der SV-Plot hat ein eigenes Menü, Statusleiste, Symbolleiste, Dialogleiste und Plot-Fenster. Es können mehrere Fenster mit getrennten SV-Plot Sätzen angezeigt, minimiert und maximiert werden. Standard-Windows-Befehle können verwendet werden, um die Größe dieser Fenster zu ändern, ihre ursprüngliche Größe wiederherzustellen und sie zu verschieben.

Eine Anzahl von Befehlen werden im SV-Plot unterstützt, einschließlich Befehle zum Drucken von Plots und Exportieren von Plot-Daten.

Weitere Informationen finden Sie unter diesen Themen:

  Menü SV-Plot

  Statusleiste SV-Plot

  Symbolleiste SV-Plot

  Dialogleiste SV-Plot

  Fenster SV-Plot


     Fenster SV-Plot

Weitere Informationen

 Siehe auch

Es können mehrere Plots im selben Fenster dargestellt werden oder neue Fenster können geöffnet werden, um getrennte Plots oder Auswahlen von Plots anzuzeigen.

Befolgen Sie diese Richtlinien:

  Neue Fenster können geöffnet werden und einzelne oder mehrere Plots können im selben Fenster angezeigt werden.

  Fenster-Befehle können aus dem Fenster- oder Systemmenü gewählt werden, um Fenster zu minimieren, maximieren, zu schließen, die Größe wiederherzustellen oder zu verändern.

  Fenster-Befehle können verwendet werden, um Fenster nebeneinander oder überlappend darzustellen und Fenster-Symbole anzuordnen.

  Der Plot im aktiven Fenster kann auf einem Drucker oder in eine Datei ausgegeben werden.

  Die zur Erzeugung eines Plots verwendeten Daten können auch in tabellarischer Form in eine Datei ausgegeben werden. Diese Datei kann später mit jedem Texteditor ausgedruckt werden.


     Menü SV-Plot

 Überblick und weitere Informationen

Verwenden Sie dieses Menü, um Plots mit SV-Verfolgungsrohdaten anzuzeigen, zu drucken und zu exportieren.

Alle SV-Plot Befehle können vom Menü aus aufgerufen werden. Einige Befehle sind auch in der Symbolleiste und Dialogleiste zugänglich. Viele Befehle haben Zugriffstasten (Hotkeys).

Folgende Befehle sind im Fenster GPS-Signal-Plots verfügbar:

Datei-Befehle

  Neuer Plot

  Exportieren…

  Drucken…

  Druckereinrichtung

  Beenden

Ansichts-Befehle

  Daten

  Symbolleiste

  Dialogleiste

Fenster-Befehle

  Überlappend

  Nebeneinander

  Symbole anordnen

Hilfe-Befehle

  Hilfe SV-Plot

  Index

  Hilfe benutzen


     Symbolleiste SV-Plot

 Überblick und weitere Informationen

Verwenden Sie die Symbolleiste, um neue Plot-Fenster zu öffnen, Daten zu exportieren, Plots zu drucken und die Hilfe anzuzeigen.

Folgende Befehlsschaltflächen sind verfügbar:

	Neues Plot-Fenster
	Daten in Datei exportieren
	Plot drucken


     Statusleiste SV-Plot

 Überblick und weitere Informationen

Die Statusleiste zeigt den beobachteten Wert und die Zeit entsprechend der Position des Mauszeigers im Fenster an.

Sie können die Maus verwenden, um herauszufinden, wann ein Beobachtungswert während des Beobachtungszeitraums aufgezeichnet wurde.

Anzeigebereich für Meldungen

Meldungen zu Befehlen im SV-Plot werden in diesem Anzeigebereich angezeigt. Wenn ein Menübefehl mit dem Auswahlbalken hervorgehoben ist oder die Maus auf eine Schaltfläche der Symbolleiste oder der Dialogleiste zeigt, werden in diesem Bereich detailliertere Informationen über den Befehl angezeigt.

Anzeigebereich für SV-Verfolgungsdaten

Der Wert, der in diesem Anzeigebereich erscheint, hängt von dem im Plot angezeigten Datentyp und der Position der Maus ab.

Diese Anzeige wird automatisch mit den Meßeinheiten aktualisiert, die für einen bestimmten Datentyp gelten, wenn mehrere Typen von SV-Verfolgungsdaten im selben Fenster geplottet werden. Sie können die Legende am unteren Rand des Plots verwenden, um sich über die Meßeinheiten der angezeigten Satellitendaten zu informieren. Die aktuelle Position des Mauszeigers, der sich über geplotteten Daten befindet, bestimmt die in dieser Anzeige erscheinende Meßeinheit.

Anzeigebereich für Zeit

In diesem Bereich wird die Zeit angezeigt, in der SV-Verfolgungsdaten aufgezeichnet wurden. Zeitwerte werden in GPS-Wochen/Sekunden oder in der örtlichen Windows-Zeit angezeigt. Sie können das Zeitformat im Dialogfeld Optionen Zeitanzeige ändern.


     Dialogleiste SV-Plot

 Überblick und weitere Informationen

Verwenden Sie die Schaltflächen der Dialogleiste, um den Wert von SV-Verfolgungsrohdaten zu plotten, die über den Beobachtungszeitraum für den gewählten Satelliten und die aktive Vermessung aufgezeichnet wurden.

So plotten Sie die Daten:

  Klicken Sie auf eine beliebige Kombination von Schaltflächen in der Dialogleiste.

Sie können mit dem Mauszeiger auf jeden Beobachtungswert im Plot zeigen und die Beobachtungszeit und den Wert der SV-Verfolgungsrohdaten in der Statusleiste ablesen.

TIP: Sie können die Dialogleiste verankern und verschieben. Die Dialogleiste kann rechts von der Symbolleiste oder unterhalb der Statusleiste verankert werden.

Folgende Schaltflächen sind in der Dialogleiste verfügbar:

L1 S-Bereich

Verwenden Sie diese Schaltfläche, um den verfolgten L1-Stationär-Bereich (in Metern) des Satelliten, aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl L1 S-Bereich.

Azimut

Verwenden Sie diese Schaltfläche, um die verfolgten Azimutdaten (in Grad) des Satelliten, aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl Azimut.

Höhe

Verwenden Sie diese Schaltfläche, um die verfolgten Höhendaten (in Grad) des Satelliten, aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl Höhe.

L1 SNR

Verwenden Sie diese Schaltfläche, um das Signal-Rausch-Verhältnis der verfolgten L1-Trägerphase, aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl L1 SNR.

L2 SNR

Verwenden Sie diese Schaltfläche, um das Signal-Rausch-Verhältnis der verfolgten L2-Trägerphase, aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl L2 SNR.

L1-Phase

Verwenden Sie diese Schaltfläche, um die verfolgten L1-Trägerphasendaten (in Zyklen), aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl L1-Phase.

L2-Phase

Verwenden Sie diese Schaltfläche, um die verfolgten L2-Trägerphasendaten (in Zyklen), aufgezeichnet über die Beobachtungszeit, zu plotten. Weitere Informationen finden Sie unter Befehl L2-Phase.

L1 Doppler

Verwenden Sie diese Schaltfläche, um den verfolgten L1 Doppler (in kHz) über die Beobachtungszeit zu plotten. Weitere Informationen finden Sie unter Befehl L1 Doppler.

L1 Aux C/A

Weitere Informationen finden Sie unter Befehl L1 Aux C/A.

Uhrfehler

Verwenden Sie diese Schaltfläche, um den Uhrfehler (in Millisekunden) über die Beobachtungszeit zu plotten. Weitere Informationen finden Sie unter Befehl Uhrfehler.


     Befehl Kontinuierlich (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um die in der Zeitraum-Ansicht angezeigten kontinuierlichen Segmente zu filtern.

So filtern Sie die kontinuierlichen Segmente in der Zeitraum-Ansicht:

1.	Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht.

2.	Wählen Sie Ansicht Filter / Kontinuierlich.

Die Besetzungssegmente werden ein- oder ausgeblendet.

So filtern Sie kontinuierliche Segmente:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

Die Besetzungssegmente werden ein- oder ausgeblendet.


     Befehl Löschen (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um ein Vermessungs- oder Besetzungs element in Timeline zu löschen. Da diese Timeline-Elemente Projektdaten darstellen, werden alle Referenzen zu den zugeordneten Daten im Projekt entfernt.

So wählen Sie den Befehl Löschen in der Zeitraum-Ansicht:

1.	Klicken Sie mit der rechten Maustaste auf das Vermessungs- oder Besetzungselement.

2.	Wählen Sie Löschen.

So wählen Sie den Befehl Löschen in der Vermessungsansicht:

1.	Klicken Sie auf das Vermessungs- oder Besetzungselement.

2.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie Bearbeiten / Löschen.

  Drücken Sie Entf.

Die dem Element zugeordneten Vermessungs- oder Besetzungsdaten werden gelöscht, und das Erscheinungsbild des Elements ändert sich. Das Element wird zu einem Rechteck mit schwarzer Umrandung, um anzuzeigen, daß an dieser Stelle der Zeitlinie Daten existiert haben. Gelöschte Daten werden aus dem Projekt entfernt und sind nicht länger zugänglich.

ACHTUNG: Bedenken Sie die Auswirkungen des Löschens von Vermessungs- oder Besetzungsdaten aus dem Projekt.


     Befehl DOP-Plot (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um den DOP-Plot anzuzeigen. Dieser Befehl ist nur verfügbar, wenn eine Besetzung in der Zeitraum-Ansicht ausgewählt ist.

So zeigen Sie einen DOP-Plot über das Menü Besetzung an:

1.	Klicken Sie mit der rechten Maustaste auf das Besetzungselement.

2.	Wählen Sie Ephemeriden-Info / DOP-Plot.

Der DOP-Plot wird angezeigt.

So zeigen Sie den DOP-Plot mit der Plot-Symbolleiste an:

1.	Klicken Sie auf das Besetzungselement.

2.	Klicken Sie in der Plot-Symbolleiste auf

Der DOP-Plot wird angezeigt.


     Befehl Aktivieren/Deaktivieren (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um Timeline-Elemente zu aktivieren oder zu deaktivieren. Da Timeline-Elemente wirkliche Projektdaten wiedergeben, werden die Daten ebenfalls aktiviert oder deaktiviert.

Diesen Befehl ist besonders hilfreich für die Deaktivierung problematischer Daten, durch die sich evtl. die Qualität der Basislinienlösung verbessert. Wenn sich die Ergebnisse der Basislinienverarbeitung nach dem Deaktivieren des Elements nicht verbessern, aktivieren Sie das Element erneut.

Dieser Befehl steht auch für die Bearbeitung kleiner Bereiche von GPS-Vermessungen zur Verfügung, z. B. bei Bereichen mit einer großen Anzahl von Phasensprüngen.

HINWEIS: Satelliten, GPS-Beobachtungen und ausgewählte Bereiche von GPS-Beobachtungen können aktiviert oder deaktiviert werden. Einige Timeline-Elemente sind geschützt und können nicht direkt deaktiviert werden. Geschützte Elemente sind z. B. Ephemeriden-Symbole und Standpunkt-Symbole.

So wählen Sie den Befehl Aktivieren/Deaktivieren in der Zeitraum-Ansicht:

1.	Wählen Sie das Satelliten-Symbol oder GPS-Beobachtungselement.

2.	Klicken Sie mit der rechten Maustaste auf das Element.

Ein Menü mit dem Befehl Aktivieren/Deaktivieren erscheint.

So wählen Sie den Befehl Aktivieren/Deaktivieren für einen ausgewählten Bereich innerhalb einer GPS-Beobachtung:

1.	Ziehen Sie ein Auswahlrechteck um den Bereich der GPS-Beobachtungen.

2.	Klicken Sie mit der rechten Maustaste innerhalb des Auswahlrechtecks.

Ein Menü mit dem Befehl Aktivieren/Deaktivieren erscheint.

So wählen Sie den Befehl Aktivieren/Deaktivieren für eine Auswahl von GPS-Beobachtungen:

1.	Ziehen Sie ein Auswahlrechteck um den Bereich der GPS-Beobachtungselemente.

2.	Klicken Sie mit der rechten Maustaste innerhalb des Auswahlrechtecks.

Ein Menü mit dem Befehl Aktivieren/Deaktivieren erscheint.


     Befehl Ephemeriden (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um die in der Zeitraum-Ansicht angezeigten Ephemeriden-Symbole zu filtern. Jedesmal, wenn dieser Befehl ausgeführt wird, blendet die Filteraktion die Ephemeriden-Symbole aus oder ein.

So filtern Sie Ephemeriden-Symbole in der Zeitraum-Ansicht:

1.	Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht.

2.	Wählen Sie Ansicht Filter.

Ein Untermenü mit dem Befehl Ephemeriden erscheint.

So filtern Sie Ephemeriden-Symbole:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht.

2.	Klicken Sie in der Symbolleiste auf [image].


     Befehl Ephemeriden-Info (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um auf ein Untermenü mit Optionen zur Anzeige des DOP-Plots und des Sky-Plots für eine ausgewählte Besetzung zuzugreifen.

So zeigen Sie das Untermenü Ephemeriden-Info an:

1.	Wählen Sie das Besetzungselement. Die Besetzung wird hervorgehoben.

2.	Klicken Sie mit der rechten Maustaste auf die Besetzung.

Ein Menü mit dem Befehl Ephemeriden-Info erscheint.

   Folgende Untermenübefehle sind verfügbar:

  DOP-Plot

  Sky-Plot

HINWEIS: Die obigen Befehle sind auch in der Plot-Symbolleiste verfügbar.


     Befehl Alle expandieren (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um alle Datenordner in der Timeline-Steuerleiste zu öffnen.

HINWEIS: Es muß mindestens ein Ordner geschlossen sein, bevor dieser Befehl verfügbar wird.

So wählen Sie den Befehl Alle expandieren in der Steuerleiste:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Steuerleiste oder einen Datenordner. Ein Menü mit dem Befehl Alle expandieren erscheint.

So wählen Sie den Befehl Alle expandieren in der Timeline-Symbolleiste:

1.	Klicken Sie auf den Hintergrund der Steuerleiste oder einen Datenordner.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

TIP: Sie können einzelne Datenordner durch Klicken auf das [image] -Symbol auf dem Datenordner öffnen.


     Befehl Nächste (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um die Zeitraum-Ansicht zum nächsten Vermessungselement zu verschieben. Wählen Sie diesen Befehl mehrere Male, um die Zeitraum-Ansicht schnell zu den aufeinanderfolgenden Vermessungslementen im Datenordner zu verschieben.

So wählen Sie den Befehl Nächste in der Zeitraum-Ansicht:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht. Ein Menü mit dem Befehl Nächste erscheint.

So wählen Sie den Befehl Nächste in der Timeline-Symbolleiste:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht, ein Vermessungs- oder Besetzungselement.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

TIP: Sie können die Ansicht auch direkt zu einem Besetzungselement verschieben. Beispiel: Sie können die Basislinieneigenschaften in der Vermessungsansicht ansehen und eine Besetzung aus der Auswahlliste wählen. Dies verschiebt die Zeitraum-Ansicht zu der ausgewählten Besetzung und hebt diese hervor.

TIP: Sie können auch den Befehl Zoom-Ausdehnung verwenden, um die gesamte Zeitlinie anzuzeigen, die gewünschte Besetzung auswählen und den Befehl Zeitraum zoomen verwenden, um sie in der Zeitraum-Ansicht anzusehen.


     Befehl Vorhergehend (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um die Zeitraum-Ansicht zum Endpunkt der vorherigen Besetzung zu verschieben. Wählen Sie diesen Befehl mehrere Male, um die Zeitraum-Ansicht schnell zu allen aufeinanderfolgenden Besetzungen in den Vermessungsdaten zu verschieben.

So wählen Sie den Befehl Vorhergehend in der Zeitraum-Ansicht:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht, ein Vermessungsrechteck oder ein Besetzungselement.

Ein Menü mit dem Befehl Vorhergehend erscheint.

So wählen Sie den Befehl Vorhergehend in der Timeline-Symbolleiste:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht, ein Vermessungselement oder ein Besetzungselement.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

TIP: Sie können die Ansicht auch direkt zu einem Besetzungselement verschieben. Beispiel: Sie können die Basislinieneigenschaften im Fenster Vermessungsansicht ansehen und eine Besetzung aus der Auswahlliste wählen. Dies verschiebt die Zeitraum-Ansicht zu der ausgewählten Besetzung und hebt diese hervor.

TIP: Sie können auch den Befehl Zoom-Ausdehnung verwenden, um die gesamte Zeitlinie anzuzeigen, die gewünschte Besetzung auswählen und den Befehl Zeitraum zoomen verwenden, um sie in der Zeitraum-Ansicht anzusehen.


     Befehl Satelliten (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um alle GPS-Beobachtungen zu filtern, die in der Zeitraum-Ansicht erscheinen. Jedesmal, wenn dieser Befehl ausgeführt wird, werden die GPS-Beobachtungen ein- oder ausgeblendet.

So filtern Sie GPS-Beobachtungen in der Zeitraum-Ansicht:

1.	Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht.

2.	Wählen Sie Ansicht Filter.

Ein Untermenü mit dem Befehl Satelliten erscheint.

So filtern Sie GPS-Beobachtungen mit der Timeline-Symbolleiste:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

Alle Ephemeriden-Symbole, die den GPS-Beobachtungen zugeordnet sind, werden ebenfalls ein- und ausgeblendet, wenn dieser Befehl ausgeführt wird.


     Befehl Alle reduzieren (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um alle geöffneten Datenordner in der Timeline-Steuerleiste zu schließen.

HINWEIS: Mindestens ein Datenordner muß geöffnet sein, bevor dieser Befehl verfügbar wird.

So wählen Sie den Befehl Alle reduzieren in der Steuerleiste:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Steuerleiste oder einen Datenordner. Ein Menü mit dem Befehl Alle reduzieren erscheint.

So wählen Sie den Befehl Alle reduzieren in der Timeline-Symbolleiste:

1.	Klicken Sie auf den Hintergrund der Steuerleiste oder einen Datenordner.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

TIP: Sie können auch einzelne Datenordner durch Klicken auf das [image] -Symbol auf dem Ordner schließen.


    Befehl Sky-Plot (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um einen Sky-Plot anzuzeigen. Dieser Befehl ist nur verfügbar, wenn ein Besetzungselement in der Zeitraum-Ansicht ausgewählt ist. Die Sky-Plot-Anzeige zeigt einen Plot des örtlichen Horizonts der Satellitenkonstellation an, die vom ausgewählten Punkt zur Zeit der Besetzung sichtbar war. Satellitenpositionen werden aus den Ephemeriden-Informationen berechnet, die zur Zeit der Beobachtung gültig waren, und werden in Azimut und Höhe angezeigt.

So zeigen Sie den Sky-Plot einer Besetzung an:

1.	Führen Sie einen der nachfolgenden Schritte aus, um die Datenordner zu öffnen:

  Öffnen Sie in der Steuerleiste einen Datenordner unter Verwendung einer der folgenden Aktionen:

  Klicken Sie auf [image] auf dem Datenordner.

  Klicken Sie mit der rechten Maustaste auf den Datenordner, und wählen Sie Alle expandieren.

  Klicken Sie in der Timeline-Symbolleiste auf [image].

Die erste Aktion zeigt Satelliten-Symbole für die gewählten Datenordner an. Die beiden alternativen Aktionen expandieren alle Datenordner.

2.	Wählen Sie das Besetzungselement.

3.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Sky-Plot zu wählen:

  Klicken Sie mit der rechten Maustaste auf die anzuzeigende Besetzung, und wählen Sie Ephemeriden-Info, um ein Untermenü mit dem Befehl Sky-Plot anzuzeigen.

  Klicken Sie in der Plot-Symbolleiste auf [image].


     Befehl SV-Plot (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um die SV-Plot-Anzeige anzusehen. Der SV-Plot enthält Befehle für die Anzeige und das Drucken ausgewählter Informationen zur Satellitenverfolgung. Er ist auch hilfreich bei der Analyse von Satellitenrohdaten individueller Satelliten. Dieser Befehl ist nur verfügbar, wenn ein Satelliten-Symbol in der Steuerleiste gewählt ist.

So zeigen Sie den SV-Plot an:

1.	Führen Sie einen der nachfolgenden Schritte aus, um die Datenordner zu öffnen:

  Öffnen Sie in der Steuerleiste einen Datenordner mit einer dieser Aktionen:

  Klicken Sie auf [image] auf dem gewünschten Datenordner.

  Klicken Sie mit der rechten Maustaste auf den Datenordner, und wählen Sie Alle expandieren.

  Klicken Sie in der Timeline-Symbolleiste auf [image].

Die erste Aktion zeigt Satelliten-Symbole für den ausgewählten Datenordner an. Die beiden alternativen Aktionen öffnen einen oder mehrere Datenordner.

2.	Wählen Sie das gewünschte Satelliten-Symbol.

3.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl SV-Plot zu wählen:

  Klicken Sie mit der rechten Maustaste auf das Satelliten-Symbol, um ein Menü mit dem Befehl SV-Plot anzuzeigen.

  Klicken Sie in der Timeline-Symbolleiste auf [image].


     Befehl Zeitoptionen (Timeline)

Weitere Informationen

Dialogfeld	Siehe auch

Verwenden Sie diesen Befehl, um das Dialogfeld Optionen Zeitanzeige mit Optionen zur Auswahl des Zeitformats anzuzeigen. Dieses Zeitformat wird verwendet, um die Zeit im Zeit-Lineal, den Timeline-Eigenschaftsdialogfeldern, im SV-Plot, Sky-Plot, DOP-Plot, und in der Statusleiste der Vermessungsansicht anzuzeigen.

Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld anzuzeigen:

  Doppelklicken Sie auf das Zeit-Lineal.

  Klicken Sie mit der rechten Maustaste auf das Zeit-Lineal, um ein Menü mit dem Befehl Zeitoptionen anzuzeigen.


     Befehl Ansicht Filter (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um ein Untermenü mit Befehlen anzuzeigen, die verwendet werden, um die Informationen in der Zeitraum-Ansicht zu filtern.

1.	Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht.

2.	Wählen Sie Ansicht Filter aus dem Menü.

Ein Untermenü mit Befehlen erscheint.

Folgende Befehle sind verfügbar:

  Kontinuierlich

  Satelliten

  Ephemeriden

HINWEIS: Dieser Befehl ist nicht in der Timeline-Symbolleiste verfügbar, aber die einzelnen Befehle des Untermenüs sind verfügbar.


    Befehl Vergrößern (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um die Zeitraum-Ansicht um 200% zu vergrößern. Die Felder Startzeit und Endzeit im Zeit-Lineal werden aktualisiert, um den kürzeren Zeitraum wiederzugeben.

So wählen Sie den Befehl Vergrößern in der Zeitraum-Ansicht:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht. Ein Menü mit dem Befehl Vergrößern erscheint.

So wählen Sie den Befehl Vergrößern in der Vermessungsansicht:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht.

2.	Führen Sie einen der nachfolgenden Schritte aus, um den Befehl Vergrößern zu wählen:

  Wählen Sie Ansicht / Zoom, um ein Untermenü mit dem Befehl Vergrößern anzuzeigen.

  Klicken Sie in der Ansichtsparameter-Symbolleiste auf [image].


Zoom-Ausdehnung Befehl (Timeline)
    Befehl Zoom-Ausdehnung (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um die Zeitraum-Ansicht so zu verkleinern, daß die gesamte Zeitlinie angezeigt wird. Dieser Befehl ist hilfreich, um den Zeitraum, der von einem Timeline-Element belegt wird, im Verhältnis zur gesamten Zeitlinie anzuzeigen. Sie können diesen Befehl benutzen und dann den Befehl Vorherige Ansicht verwenden, um zur ursprünglichen Vergrößerung zurückzukehren.

So wählen Sie den Befehl Zoom-Ausdehnung in der Timeline-Ansicht:

  Klicken Sie mit der rechten Maustaste auf ein Timeline-Element oder den Fensterhintergrund.

Ein Menü mit dem Befehl Zoom-Ausdehnung erscheint.

So wählen Sie den Befehl Zoom-Ausdehnung in der Vermessungsansicht:

1.	Klicken Sie auf ein Timeline-Element oder den Hintergrund der Zeitraum-Ansicht.

2.	Wählen Sie Ansicht / Zoom, um ein Untermenü mit dem Befehl Zoom-Ausdehnung anzuzeigen.


    Befehl Verkleinern (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um die Zeitraum-Ansicht um 50% zu verkleinern. Die Felder Startzeit und Endzeit im Zeit-Lineal werden aktualisiert, um den längeren Zeitraum wiederzugeben.

So wählen Sie den Befehl Verkleinern in Timeline:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht. Ein Menü mit dem Befehl Verkleinern erscheint.

So wählen Sie den Befehl Verkleinern in der Vermessungsansicht:

1.	Klicken Sie auf den Hintergrund der Zeitraum-Ansicht.

2.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie Ansicht / Zoom, um ein Untermenü mit dem Befehl Verkleinern anzuzeigen.

  Klicken Sie in der Ansichtsparameter-Symbolleiste auf [image].


     Befehl Vorherige Ansicht (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um zur vorherigen Vergrößerung zu zoomen.

So wählen Sie den Befehl Vorherige Ansicht in der Timeline-Ansicht:

  Klicken Sie mit der rechten Maustaste auf ein Timeline-Element. Ein Menü mit dem Befehl Vorherige Ansicht erscheint.

So wählen Sie den Befehl Vorherige Ansicht in der Vermessungsansicht:

1.	Klicken Sie auf ein Timeline-Element.

2.	Führen Sie einen der nachfolgenden Schritte aus, um auf den Befehl zuzugreifen:

  Wählen Sie Ansicht / Zoom, um ein Untermenü mit dem Befehl Vorherige Ansicht anzuzeigen.

  Klicken Sie in der Ansichtsparameter-Symbolleiste auf [image].


     Befehl Zeitraum zoomen (Timeline)

Weitere Informationen

 Siehe auch

Verwenden Sie diesen Befehl, um den Zeitraum eines ausgewählten Timeline-Elements auf die Breite der Zeitraum-Ansicht zu zoomen.

So zoomen Sie das Element auf die Breite der Zeitraum-Ansicht:

1.	Wählen Sie ein Timeline-Element.

2.	Klicken Sie mit der rechten Maustaste auf das Element.

3.	Wählen Sie Zeitraum zoomen.


     Befehl Ereignisse (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diesen Befehl, um Ereignis-Symbole in der Zeitraum-Ansicht anzuzeigen.

  Klicken Sie in der Timeline-Symbolleiste auf [image]. Die Ereignis-Symbole erscheinen in der Zeitraum-Ansicht, wenn Ereignisse in den Daten enthalten sind.


     Befehl Eigenschaften (Timeline)

Weitere Informationen

Wie kann ich ...	Dialogfeld

Verwenden Sie diesen Befehl, um das Eigenschaftsdialogfeld für das ausgewählte Timeline-Element anzuzeigen.

1.	Klicken Sie mit der rechten Maustaste auf das Timeline-Element

2.	Wählen Sie Eigenschaften. Das entsprechende Eigenschaftsdialogfeld wird angezeigt.

Es gibt Eigenschaftsbefehle für folgende Dialogfelder:

  Empfänger-Information

  GPS-Beobachtung

  Vermessung

  Statische Besetzung

  Kontinuierliches Besetzungssegment

  Ephemeriden-Symbol

TIP: Sie können ebenfalls auf ein Timeline-Element doppelklicken, um seine Eigenschaften anzuzeigen.


     Befehl Timeline-Plots (Timeline)

Verwenden Sie diesen Befehl, um die Symbolleiste Timeline-Plots ein- oder auszublenden.

  Wählen Sie Ansicht / Symbolleisten / Timeline-Plots. Jedesmal, wenn dieser Befehl ausgeführt wird, wird die Symbolleiste Timeline-Plots ein- oder ausgeblendet.


     Befehl Timeline (Symbolleisten)

Verwenden Sie diesen Befehl, um die Timeline-Symbolleiste ein- oder auszublenden.

  Wählen Sie Ansicht / Symbolleisten / Timeline. Jedesmal, wenn dieser Befehl ausgeführt wird, wird die Timeline-Symbolleiste ein- oder ausgeblendet.


     Befehl Standpunkte (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Die kleinen, roten, rechteckigen Standpunkt-Symbole und Bezeichnungen, die angezeigt werden, um statische Besetzungen zu kennzeichnen, können gefiltert werden.

1.	Zeigen Sie Timeline an.

2.	Klicken Sie in der Timeline-Symbolleiste auf [image].

Jedesmal, wenn der Befehl Standpunkte ausgeführt wird, werden die Standpunkt-Symbole aktiviert oder deaktiviert.

HINWEIS: Standpunkt-Symbole können nicht gelöscht oder deaktiviert werden. Sie werden nur mit ihrer übergeordneten Besetzung gelöscht oder deaktiviert.


     Befehl Alles markieren (Timeline)

Weitere Informationen

Wie kann ich ...	Siehe auch

Wählen Sie diesen Befehl in einem Feld für die Bearbeitung des Zeitraums, um alle Daten in den Feldern auszuwählen, die die Zeit und das Datum der Beobachtungen enthalten. Dies ist hilfreich, um den gesamten Inhalt auszuwählen, bevor er durch Ausschneiden oder Kopieren in die Zwischenablage übertragen wird.

So wählen Sie alle Daten in einem Feld für die Bearbeitung des Zeitraums aus:

1.	Klicken Sie auf das Feld Start- oder Endzeit.

2.	Klicken Sie auf die rechte Maustaste, und wählen Sie Alles markieren.

Der gesamte Inhalt des Felds wird ausgewählt.


    Dialogfeld Empfänger-Information

Weitere Informationen

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um allgemeine Informationen über den Empfänger zu erhalten, mit dem die Vermessungsdaten aufgezeichnet wurden. Alle diese Felder sind reine Anzeigefelder. Sie enthalten Daten, die von den heruntergeladenen Empfänger-Informationsdatensätzen oder aus den Kopf-Datensätzen in einer RINEX-Datei stammen.

So zeigen Sie das Dialogfeld Empfänger-Information an:

  Doppelklicken Sie auf den Datenordner. Das Dialogfeld Empfänger-Information erscheint. Es enthält folgende Anzeigefelder:

Seriennummer

Dieses Feld zeigt die Seriennummer des Empfängers an.

Empfängertyp

Dieses Feld zeigt das Empfängermodell an.


    Dialogfeld Vermessungsinformation

Weitere Informationen

Dialogfeld	Siehe auch

Verwenden Sie dieses Dialogfeld, um Informationen über die individuellen Aufzeichnungssitzungen der Vermessungsdaten anzusehen.

Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Vermessungsinformation zu öffnen:

  Doppelklicken Sie auf das Vermessungselement.

  Klicken Sie mit der rechten Maustaste auf das Vermessungselement, und wählen Sie Eigenschaften.

Folgende Datenfelder sind verfügbar:

Sitzungs-ID

Dieses Feld zeigt den Namen der Vermessungssitzung an. Geben Sie eine neue Sitzungs-ID ein, wenn Sie die Sitzung neu bezeichnen möchten. Dies ist das einzige bearbeitbare Feld in diesem Dialogfeld.

Dateiname

Dieses Feld zeigt den Dateinamen der Vermessung an.

Startzeit

Dieses Feld zeigt die Startzeit der Vermessungssitzung in der örtlichen Windows-Zeit oder GPS-Wochen/Sekunden an. Das Zeitformat hängt von den aktuellen Einstellungen der Zeitoptionen ab.

Stoppzeit

Dieses Feld zeigt die Stoppzeit der Vermessungssitzung in der örtlichen Windows-Zeit oder GPS-Wochen/Sekunden an. Das Zeitformat hängt von den aktuellen Einstellungen der Zeitoptionen ab.

Nav.-Prozessor Version

Dieses Feld zeigt die Firmware-Version des Navigationsprozessors des Empfängers an (nur bei Trimble-Empfängern).

Synchr.-Rate

Dieses Feld zeigt die minimale Synchronisierungsrate (in Sekunden) an, die verwendet wird, um Daten für die Vermessungssitzung aufzuzeichnen.

Signal-Prozessor Version

Dieses Feld zeigt die Firmware-Version des Signalprozessors des Empfängers an (nur bei Trimble-Empfängern).

Höhenmaske

Dieses Feld zeigt die Höhenmaske an, die aktiv war, als Vermessungsdaten aufgezeichnet wurden.

DC-Typ

Dieses Feld zeigt den Datenrekorder und Version des Survey Controllers an, wenn Vermessungsdaten mit dem Survey Controller aufgezeichnet wurden.


Dialogfeld Besetzung/Datensegmenteigenschaften - Überblick
    Dialogfeld Besetzung/Datensegmenteigenschaften − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie dieses Dialogfeld, um alle Informationen anzuzeigen und zu bearbeiten, die sowohl auf statische Besetzungen als auch auf kontinuierliche und bewegte Segmente zutreffen. Für jedes Element kann ein eigenes Dialogfeld geöffnet werden, dadurch können Sie Daten mehrerer Segmente vergleichen.

Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Besetzung/Datensegmenteigenschaften anzuzeigen:

  Doppelklicken Sie auf ein Besetzungselement.

  Klicken Sie mit der rechten Maustaste auf ein Besetzungselement, und wählen Sie Eigenschaften.

Folgende Register sind verfügbar:

  Segment

  Antenne

In der rechten oberen Ecke des Dialogfelds Besetzung/Datensegmenteigenschaften befinden zwei Links-Rechts-Pfeilschaltflächen. Wenn die Vermessung mehrere Besetzungen enthält, verwenden Sie diese Umschaltflächen, um Informationen über die nächste oder vorherige Besetzung anzuzeigen. Wenn das Dialogfeld für die nächste Besetzung in einem anderen Eigenschaftsdialogfeld angezeigt wird, und der Rechtspfeil gedrückt wird, wird diese Besetzung nicht angezeigt.


Dialogfeld Besetzung/Datensegmenteigenschaften - Register Segment
    Dialogfeld Besetzung/Datensegmenteigenschaften − Register Segment

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Das Register Segment zeigt umfassende Besetzungsinformationen zur Bearbeitung an.

Führen Sie einen der nachfolgenden Schritte aus, um das Register Segment anzuzeigen:

  Doppelklicken Sie auf ein Besetzungselement.

  Klicken Sie mit der rechten Maustaste auf ein Besetzungselement, und wählen Sie Eigenschaften.

Das Dialogfeld Besetzung/Datensegmenteigenschaften mit dem Register Segment erscheint.

Folgende Felder und Steuerelemente sind verfügbar:

Punktname

Dieses Feld zeigt den Namen des besetzten Punkts an. Dieses Feld ist leer für bewegte und kontinuierliche Segmente.

Segmenttyp

Wählen Sie eine Option aus dieser Liste, um das Segment in einen der folgenden Segmenttypen zu ändern:

  Statische Besetzung

  FastStatic-Besetzung

  Stop & Go-Besetzung

  Bewegtes Segment

  Kontinuierliches Segment

HINWEIS: Die Optionen Statische Besetzung oder FastStatic-Besetzung erscheinen nur, wenn der entsprechende Datentyp in der Datei enthalten ist.

WARNUNG: Sie sollten beim Ändern einer Besetzung in ein Bewegtes oder Kontinuierliches Segment vorsichtig sein. Wenn eine statische Besetzung zu einer kontinuierlichen Besetzung geändert wird, wird die Standpunktreferenz für diese Besetzung gelöscht.

Startzeit

Bearbeiten Sie dieses Feld, um die Startzeit der Besetzung zu ändern. Die Zeit wird in der örtlichen Windows-Zeit oder GPS-Wochen/Sekunden angezeigt, abhängig von den aktuellen Einstellungen der Zeitoptionen.

Stoppzeit

Bearbeiten Sie dieses Feld, um die Stoppzeit der Besetzung zu ändern. Die Zeit wird in der örtlichen Windows-Zeit oder GPS-Wochen/Sekunden angezeigt, abhängig von den aktuellen Einstellungen der Zeitoptionen.

TIP: Start- und Stoppzeiten können auch durch Auswählen des Besetzungselements in der Zeitraum-Ansicht und Ändern der Felder Start- und Endzeit im Zeit-Lineal bearbeitet werden.


Dialogfeld Besetzung/Datensegmenteigenschaften - Register Antenne
 Dialogfeld Besetzung/Datensegmenteigenschaften − Register Antenne

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie dieses Register, um die Höhe der Antenne (in Metern), den Antennentyp und den Meßtyp zu ändern.

So zeigen Sie die Antenneneigenschaften an:

1.	Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Besetzung/Datensegmenteigenschaften zu öffnen:

  Doppelklicken Sie auf ein Besetzungselement.

  Klicken Sie mit der rechten Maustaste auf ein Besetzungselement, und wählen Sie Eigenschaften.

Das Dialogfeld Besetzung/Datensegmenteigenschaften erscheint.

2.	Klicken Sie auf Antenne.

Die Antenneneigenschaften werden angezeigt.

Antennenhöhe

Verwenden Sie dieses Feld, um die gemessene Antennenhöhe anzuzeigen oder zu bearbeiten.

Typ

Verwenden Sie dieses Feld, um den mit dem Empfänger verbundenen Antennentyp anzuzeigen oder auszuwählen.

Gemessen bis

Verwenden Sie dieses Feld, um die Methode zur Messung der Antennenhöhe anzuzeigen oder auszuwählen.

Unter dem Feld Gemessen bis befindet sich eine Gruppe von Optionen, die bestimmen, wie die Antenneninformationen angewendet werden. Diese umfassen:

  Nur für diese Messung verwenden - wendet die Änderungen nur auf die ausgewählte Besetzung oder das ausgewählte Segment an. Dies ist die Voreinstellung.

  Für diese und alle folgenden Messungen in dieser Sitzung verwenden - wendet die Änderungen auf die ausgewählte Besetzung oder das ausgewählte Segment und auf alle folgenden Besetzungen und Segmente bis zum Ende des Vermessungselements an.

  Für alle Messungen in dieser Sitzung verwenden - wendet die Änderungen auf alle Besetzungen und Segmente im Vermessungselement an.


    Dialogfeld GPS-Beobachtungseigenschaften

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie dieses Dialogfeld, um die für (ein) ausgewählte(s) GPS-Beobachtungselement(e) verfügbaren Beobachtungstypen anzuzeigen.

So greifen Sie auf das Dialogfeld GPS-Beobachtungseigenschaften zu:

1.	Führen Sie einen der nachfolgenden Schritte aus, um die Datenordner in der Steuerleiste zu öffnen:

  Klicken Sie mit der rechten Maustaste auf den Datenordner, und wählen Sie Alle expandieren.

 Klicken Sie in der Timeline-Symbolleiste auf

  Klicken Sie auf das Symbol [image] auf einem Datenordner.

Alle GPS-Beobachtungen in der Zeitraum-Ansicht und alle SV-Symbole in der Steuerleiste werden angezeigt.

TIP: Diese Elemente können jederzeit durch Klicken auf [image] in der Timeline-Symbolleiste oder durch Klicken mit der rechten Maustaste auf den Datenordner und Wählen des Befehls Alle reduzieren aus dem Menü ausgeblendet werden. Sie können auch einzelne Ordner durch Klicken auf das [image] -Symbol schließen.

2.	Führen Sie einen der nachfolgenden Schritte aus, um das Eigenschaftsdialogfeld anzuzeigen:

  Doppelklicken Sie auf ein GPS-Beobachtungselement.

  Klicken Sie mit der rechten Maustaste auf ein GPS-Beobachtungselement, und wählen Sie Eigenschaften.

Das Dialogfeld GPS-Beobachtungseigenschaften erscheint.

Folgende Felder sind verfügbar:

Startzeit

Bearbeiten Sie dieses Feld, um die Startzeit der ausgewählten GPS-Beobachtung zu ändern. Die in diesem Feld angezeigte Zeit basiert anfänglich auf der aktuellen Auswahl der GPS-Beobachtung in der Zeitraum-Ansicht. Alle Änderungen, die auf GPS-Beobachtungsdaten angewendet werden, basieren auf dieser Startzeit. Wenn Sie die Startzeit in diesem Feld ändern, werden alle Änderungen auf alle in der Liste Satelliten zu bearb. gewählten Satelliten oder auf die in der Zeitraum-Ansicht gewählten GPS-Beobachtungsbereiche angewendet.

Stoppzeit

Bearbeiten Sie dieses Feld, um die Stoppzeit der ausgewählten GPS-Beobachtung zu ändern. Die in diesem Feld angezeigte Zeit basiert auf der aktuellen Auswahl der GPS-Beobachtung in der Zeitraum-Ansicht. Alle Änderungen, die auf GPS-Beobachtungsdaten angewendet werden, basieren auf dieser Stoppzeit. Wenn Sie die Stoppzeit in diesem Feld ändern, werden alle Änderungen auf alle in der Liste Satelliten zu bearb. gewählten Satelliten oder auf die in der Zeitraum-Ansicht gewählten GPS-Beobachtungsbereiche angewendet.

Beobachtungstypen

Verwenden Sie diese Gruppe von Kontrollkästchen, um die in den GPS-Beobachtungen enthaltenen Beobachtungstypen zu deaktivieren und zu aktivieren. Jeder Beobachtungstyp stellt bestimmte Satellitenrohdaten dar.

Folgende Kontrollkästchen für Beobachtungstypen sind verfügbar:

  L1-Phase

  L1 P-Code

  L1 C/A-Code

  L2 Volle Phase

  L2 Halbe Phase

  L2 P-Code

  L2 verschlüsselt

Beachten Sie folgende Richtlinien beim Ansehen und Bearbeiten von Beobachtungstypen:

  Ist ein Kontrollkästchen für einen Beobachtungstyp aktiviert, werden die Daten verwendet. Ein deaktiviertes Kontrollkästchen bedeutet, daß der Datentyp nicht enthalten ist.

  Ein graues Kontrollkästchen bedeutet, daß sowohl aktivierte als auch deaktivierte Bereiche in der GPS-Beobachtung enthalten sind, und kein Vorgang auf die Beobachtungstypen angewendet werden kann.

  Grau unterlegter Text neben dem Kästchen bedeutet, daß der Beobachtungstyp nicht verfügbar ist.

  Deaktivieren Sie das Kontrollkästchen, um ausgewählte Daten zu deaktivieren.

Zurücksetzen

Klicken Sie auf diese Schaltfläche, um alle Kontrollkästchen der Beobachtungstypen in ihren ursprünglichen Zustand zurückzusetzen, d. h. den Zustand, als die Beobachtungsdaten im Feld aufgezeichnet wurden.

Satelliten zu bearb.

Wählen Sie die Kontrollkästchen in der Liste, um die zu bearbeitenden Satelliten und ihre zugeordneten GPS-Beobachtungsrohdaten auszuwählen.

HINWEIS: Wenn mehrere Satelliten aus dieser Liste ausgewählt werden, werden Änderungen an den Eigenschaften auf alle GPS-Beobachtungen angewendet, und zwar auf den Zeitraum, der im Dialogfeld GPS-Beobachtungseigenschaften gewählt wurde.

TIP: GPS-Beobachtungen können auch direkt in der Zeitraum-Ansicht durch Ziehen eines Auswahlrechtecks um eine Gruppe von GPS-Beobachtungen oder um einen kleinen Bereich von GPS-Beobachtungen ausgewählt werden. Weitere Informationen finden Sie unter GPS-Beobachtungen auswählen und bearbeiten.

Alle akzeptieren

Klicken Sie auf diese Schaltfläche, um alle verfügbaren Beobachtungstypen für die aus der Liste Satelliten zu bearb. gewählten Satelliten für den in den Feldern Start- und Stoppzeit definierten Zeitraum zu aktivieren.

Alle deaktivieren

Klicken Sie auf diese Schaltfläche, um alle verfügbaren Beobachtungstypen für die aus der Liste Satelliten zu bearb. gewählten Satelliten für den in den Feldern Start- und Stoppzeit definierten Zeitraum zu deaktivieren.


    L1-Phase

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn der Empfänger L1-Trägerphasenmessungen empfangen kann. Einfrequenz- oder Zweifrequenz-Empfänger können diese Daten verfolgen.

Falls aktiviert, kann dieses Kontrollkästchen (für einzelne Satelliten, Gruppen von Satelliten oder Bereiche von GPS-Beobachtungselementen) deaktiviert werden, um die L1-Trägerphasendaten zu deaktivieren.


    L1 P-Code

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn der L1 P-Code auf der L1-Trägerphase verfolgt wird. Die meisten Zweifrequenz- und Einfrequenz-Empfänger können diese Daten verfolgen, wenn das Anti-Spoofing ausgeschaltet ist.

Falls aktiviert, kann dieses Kontrollkästchen (für einzelne Satelliten, Gruppen von Satelliten oder Bereiche von GPS-Beobachtungselementen) deaktiviert werden, um die L1-P-Codedaten zu deaktivieren.


    L1 C/A-Code

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn der Coarse/Acquisition-Code auf der L1-Trägerphase verfolgt wird. Einfrequenz- und Zweifrequenz-Empfänger können diese Daten verfolgen.

Falls aktiviert, kann dieses Kontrollkästchen für einzelne Satelliten, Gruppen von Satelliten oder Bereiche von GPS-Beobachtungselementen deaktiviert werden, um die L1-C/A-Codedaten zu deaktivieren.


    L2 Volle Phase

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn der GPS-Empfänger Volle Phase-L2-Trägerphasenmessungen empfangen kann. Die meisten Zweifrequenz-Empfänger können diese Daten aufzeichnen.

Falls aktiviert, kann dieses Kontrollkästchen (für einzelne Satelliten, Gruppen von Satelliten oder Bereiche von GPS-Beobachtungselementen) deaktiviert werden, um Daten für die L2-Volle Phase zu deaktivieren.


    L2 Halbe Phase

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn der GPS-Empfänger Halbe Phase-L2-Trägerphasenmessungen empfangen kann. Einige Zweifrequenz-Empfänger können nur diese Daten aufzeichnen.

Falls aktiviert, kann dieses Kontrollkästchen für einzelne Satelliten oder Gruppen von Satelliten deaktiviert werden, um die Daten für die L2-Halbe Phase zu deaktivieren.


    L2 P-Code

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn L2 P-Code auf der L2-Trägerphase verfolgt wird. Die meisten Zweifrequenz-Empfänger können diese Daten aufzeichnen, wenn das Anti-Spoofing (A/S) ausgeschaltet ist.

Falls aktiviert, kann dieses Kontrollkästchen (für einzelne Satelliten, Gruppen von Satelliten oder Bereiche von GPS-Beobachtungselementen) deaktiviert werden, um die Daten für den L2-P-Code zu deaktivieren.


    L2 verschlüsselt

 Überblick und weitere Informationen

Dieser Beobachtungstyp ist verfügbar, wenn der L2 P-Code zu Zeiten verschlüsselt ist, in denen Anti-Spoofing (A/S) aktiviert ist. Trimble-Empfänger verwenden geschützte Techniken, die den Vorteil bieten, daß Code auf L2 sogar in verschlüsselten Zeiträumen verfolgt werden kann. Die durch diese geschützten Techniken verfügbaren Messungen werden L2 verschlüsselt genannt.

Falls aktiviert, kann dieses Kontrollkästchen (für einzelne Satelliten, Gruppen von Satelliten oder Bereiche von GPS-Beobachtungselementen) deaktiviert werden, um die verschlüsselten L2-Daten zu deaktivieren.


    Dialogfeld Satelliten Ephemeriden-Information

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie dieses Dialogfeld, um die periodisch zu den GPS-Anwendern übertragenen Satelliten-Ephemeriden-Informationen anzuzeigen. Diese Informationen werden aus Satellitendaten abgeleitet und können nicht bearbeitet werden.

So greifen Sie auf das Dialogfeld Satelliten Ephemeriden-Information zu:

1.	Führen Sie einen der nachfolgenden Schritte aus, um die Ephemeriden-Symbole anzuzeigen:

  Klicken Sie in der Timeline-Symbolleiste auf [image].

  Klicken Sie mit der rechten Maustaste in der Zeitraum-Ansicht, und wählen Sie Ansicht Filter / Ephemeriden.

Blaue Ephemeriden-Symbole erscheinen in den SV-Verfolgungsinformationen.

2.	Führen Sie einen der nachfolgenden Schritte aus, um die Eigenschaften der Ephemeriden anzuzeigen:

  Doppelklicken Sie auf das Ephemeriden-Symbol des gewünschten Satelliten.

  Klicken Sie mit der rechten Maustaste auf das Ephemeriden-Symbol des gewünschten Satelliten, und wählen Sie Eigenschaften.

Das Dialogfeld Satelliten Ephemeriden-Information erscheint.

Folgende Optionen sind verfügbar:

Satelliten

Dieses Feld zeigt das dem Satelliten zugewiesene PRN-Kennzeichen an.

Erfassungszeitpunkt

Dieses Feld zeigt die GPS-Wochen/Sekunden oder die Ortszeit an, zu der die Broadcast-Ephemeriden vom Satelliten aufgezeichnet wurden. Das Zeitformat ist abhängig von den aktuellen Einstellungen der Zeitoptionen.

IODC

Dieses Feld zeigt den in den Broadcast-Ephemeriden enthaltenen IODC-Wert (Issue of Data, Clock) an.

Ephemeridenzeitpunkt

Dieses Feld zeigt die GPS-Wochen/Sekunden oder die Ortszeit an, zu der die Ephemeriden ausgegeben wurden. Das Zeitformat ist abhängig von den aktuellen Einstellungen der Zeitoptionen.

Zeit ab Epoche

Dieses Feld zeigt die Zeit ab der Ephemeriden-Referenzepoche an, gerundet auf die nächste Minute.

GPS-Woche

Dieses Feld zeigt die GPS-Woche an, in der die Ephemeriden erfaßt wurden.

GPS-Woche 0 (Null) begann am 6. Januar 1980. Ein GPS-Wochenzyklus umfaßt 1024 Wochen (0 − 1023) oder 7168 Tage. Der GPS-Wochenzyklus lief über um Mitternacht am 21. August 1999. Zu diesem Zeitpunkt lief die Übertragung der GPS-Woche über auf Woche 0 (Null). Trimble-Empfänger verfügen jedoch über einen internen Wochenzähler.

GPS-Sekunden laufen um Mitternacht am Samstag jeder GPS-Woche (bezogen auf UTC-Zeit) auf Null über.

URA

Dieses Feld zeigt die User Range Accuracy des Satelliten an, konvertiert in Meter. URA ist ein Indikator für die Reichweitengenauigkeit der Satellitendaten.

URA-Warnung

Dieses Feld informiert Sie, ob die User Range Accuracy-Warnung für den Satelliten ein- oder ausgeschaltet ist. Diese Warnung ist eingeschaltet, wenn die Reichweitengenauigkeit schlechter als der von der URA angezeigte Wert sein kann.

Zustand

Dieses Feld zeigt die in den Ephemeriden enthaltene Zustandsmeldung für den Satelliten an. Die Zustandsmeldung ist ein Indikator für die Qualität der vom Satelliten übertragenen Signale. Der Zustand des Satelliten ist gut, wenn das Feld folgendes anzeigt:

Alle SV-Daten OK.

Eine Reihe anderer Werte könnte angezeigt werden. Dies weist im allgemeinen auf einen schlechteren Zustand des Satelliten hin. Wenn Sie weitere Informationen über diese Meldungen erhalten möchten, erwerben Sie eine Kopie der Veröffentlichung ICD-GPS-200 (siehe die Bibliographie).

A/S

Dieses Feld informiert Sie, ob der Anti-Spoofing-Modus für den Satelliten ein- oder ausgeschaltet ist.


    Dialogfeld Optionen Zeitanzeige

Weitere Informationen

Wie kann ich ...	Dialogfeld

Verwenden Sie dieses Dialogfeld, um das Zeitformat zu wählen, das für die Ansicht von Zeiträumen innerhalb des Zeit-Lineals und der Zeitanzeige in allen Dialogfeldern, Anzeigen und der Statusleiste in Timeline verwendet wird.

Führen Sie einen der nachfolgenden Schritte aus, um das Dialogfeld Optionen Zeitanzeige anzuzeigen:

  Doppelklicken Sie auf das Zeit-Lineal.

  Klicken Sie mit der rechten Maustaste auf das Zeit-Lineal, und wählen Sie Zeitoptionen.

Das Dialogfeld Optionen Zeitanzeige erscheint.

Folgende Optionen sind verfügbar:

Ortszeit

Wählen Sie dieses Feld, um Zeit im lokalen Windows-Zeitformat anzuzeigen.

GPS-Woche/Sekunden

Wählen Sie dieses Feld, um Zeit in GPS-Woche/Sekunden anzuzeigen.

GPS-Woche 0 (Null) begann am 6. Januar 1980. Ein GPS-Wochenzyklus umfaßt 1024 Wochen (0 − 1023) oder 7168 Tage. Der GPS-Wochenzyklus lief über um Mitternacht am 21. August 1999. Zu diesem Zeitpunkt lief die Übertragung der GPS-Woche über auf Woche 0 (Null). Trimble-Empfänger verfügen jedoch über einen internen Wochenzähler.

GPS-Sekunden laufen um Mitternacht am Samstag jeder GPS-Woche (bezogen auf UTC) auf Null über.


    Kontinuierliche Segmente

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Kontinuierliche Segmente geben Zeiträume wieder, in denen der Empfänger, während er bewegt wird, kontinuierlich Daten aufzeichnet. Die Absicht eines kontinuierlichen Segments ist es, eine Basislinie von der Basis zum Empfänger für jeden Meßzyklus zu verarbeiten. Dies unterscheidet sich von einem bewegten (Roving) Segment nur durch die Tatsache, daß beim bewegten Segment keine Verarbeitung vorgesehen ist. Kontinuierliche Segmente haben anfänglich vor der Verarbeitung keine Punktzuordnung. Wenn die Verarbeitung jedoch abgeschlossen ist, wird für jeden Meßzyklus ein Punkt erzeugt und im Projekt gespeichert, und dadurch der Pfad des Empfängers in der Vermessungsansicht dargestellt.

Doppelklicken Sie auf ein kontinuierliches Segmentelement, um seine Eigenschaften anzuzeigen oder zu bearbeiten.

Sie können mit der rechten Maustaste irgendwo innerhalb des Segmentelements klicken, um ein Menü mit Befehlen zur Arbeit mit Segmentdaten anzuzeigen.

Der Zeitraum des kontinuierlichen Segments kann justiert werden. Ein kontinuierliches Segment kann auch in ein bewegtes Segment umgewandelt werden, damit keine Verarbeitung erfolgt.

Da das Graphikfenster und Timeline verknüpft sind, werden die im Graphikfenster ausgewählten Besetzungen von Punkten und Basislinien auch in Timeline ausgewählt, und umgekehrt. Beispiel: Sie können ein kontinuierliches Segment in Timeline auswählen, und die zugeordneten Punkte und Basislinien werden ebenfalls im Graphikfenster ausgewählt. Wenn Punkte oder Basislinien erst einmal gewählt sind, können Sie die Eigenschaften ansehen, um mehr über die Besetzung zu erfahren.

Zwei Plots mit Informationen über die Satellitenkonstellation zur Zeit der Besetzung oder des Segments können angezeigt werden, wenn ein kontinuierliches Segment ausgewählt ist. Weitere Informationen finden Sie unter diesen Themen:

  DOP-Plot

  Sky-Plot

TIP: Das Eigenschaftsfenster, das vom Graphikfenster aus aufgerufen wird, ist auch hilfreich bei der Navigation durch Timeline, um ausgewählte Besetzungen zu finden. Die in diesem Dialogfeld ausgewählten Basislinien und Punkte werden auch in Timeline ausgewählt. Sie können auf ein Besetzungselement in Timeline doppelklicken, nachdem Sie es ausgewählt haben, um seine Eigenschaften anzusehen.

Besetzungs- und Segmentelemente werden zur leichten Identifizierung in farbcodierten Rechtecken angezeigt. Weitere Informationen finden Sie unter Farbcodierschema für Besetzungen.


    Zeitraum-Ansicht

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Stellen Sie sich die Zeitraum-Ansicht als ein Vergrößerungsglas vor. Sie kann die gesamte Zeitlinie anzeigen oder kann verschoben oder gezoomt werden, um schmale Abschnitte der Zeitlinie anzuzeigen.

Timeline bietet mehrere Optionen, um die Zeitraum-Ansicht auf ausgewählte Informationen auf der Zeitlinie zu zoomen und zu verschieben. Elemente wie Besetzungs- und GPS-Beobachtungselemente können in der Zeitraum-Ansicht auf zwei Arten dargestellt werden:

  Wählen Sie einen Zoom-Befehl:

  Vergrößern

  Verkleinern

  Zoom-Ausdehnung

  Vorherige Ansicht

  Zeitraum zoomen

  Bearbeiten Sie die Zeitraum-Felder, um die Zeitraum-Ansicht zu ausgewählten Bereichen der Zeitlinie zu verschieben.

Das Zeit-Lineal deckt den Zeitraum der Beobachtungen ab, gekennzeichnet durch die Zeitraum-Felder auf der linken und rechten Seite des Zeit-Lineals. Wenn der Zeitraum zu groß ist, verschiebt Timeline die Anzeige automatisch so, daß nur der letzte Tag angezeigt wird.

Timeline-Elemente geben Daten wieder, die über die Dauer einer Vermessung aufgezeichnet wurden. Da Timeline und das Graphikfenster auch untereinander verknüpft sind, werden Daten, die im Graphikfenster ausgewählt werden, auch in der Zeitraum-Ansicht ausgewählt.

Sie können durch Klicken mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht ein Menü mit Befehlen anzeigen.


    Ephemeriden-Symbole

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Diese Symbole kennzeichnen die Zeiten, zu denen Broadcast-Ephemeriden vom Empfänger für individuelle Satelliten empfangen wurden. Ephemeriden-Informationen für jeden während der Vermessung verfolgten Satelliten werden zu den folgenden Zeiten aufgezeichnet:

  am Anfang der Vermessung (wenn der Satellit sichtbar ist)

  wenn der Satellit zum ersten Mal über die Höhenmaske steigt

  stündlich

Gemäß Voreinstellung ist der Filter für diese Symbole ausgeschaltet, wenn Timeline zum ersten Mal angezeigt wird. Sie filtern diese Symbole durch Wählen von Befehlen aus der Timeline-Symbolleiste oder aus mehreren im Timeline-Ansichtsbereich verfügbaren Menüs. Weitere Informationen finden Sie unter Timeline-Elemente filtern.

Sie können das Dialogfeld Satelliten Ephemeriden-Information durch Doppelklicken auf ein Symbol anzeigen. Dieses Dialogfeld enthält hilfreiche Informationen, einschließlich der Meldung über den Zustand des Satelliten. Diese Meldung ist hilfreich, um zu erfahren, ob der Satellit, der Daten zu der Beobachtung beisteuert, in gutem oder schlechtem Zustand war.

Wenn Sie mit der rechten Maustaste auf ein Symbol klicken, wird ein Menü mit Ephemeriden-relevanten Befehlen angezeigt.

Ephemeriden-Symbole können nicht gelöscht oder deaktiviert werden. Da Ephemeriden-Symbole mit einer GPS-Beobachtung verbunden sind, können die GPS-Beobachtung oder ausgewählte Bereiche von GPS-Beobachtungen deaktiviert werden, um alle zugeordneten Ephemeriden aus den Projektdaten zu entfernen. Weitere Informationen finden Sie unter GPS-Beobachtungen deaktivieren.


    GPS-Beobachtungen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

GPS-Beobachtungselemente erscheinen nur in der Zeitraum-Ansicht, wenn ein oder mehrere Datenordner geöffnet sind, um die während einer Vermessungssitzung aufgezeichneten Daten anzuzeigen.

Wenn ein Datenordner geöffnet ist, erscheint ein Satelliten-Symbol für jeden Satelliten, der GPS-Beobachtungen zur Vermessung beisteuert. Für jedes Symbol erscheinen GPS-Beobachtungen in der Zeitraum-Ansicht, wiedergegeben durch SV-Verfolgungsplots.

Die nachstehend angezeigten Formen und das Farbcodierschema werden in Timeline verwendet, um unterschiedliche Typen von Beobachtungsdaten voneinander zu unterscheiden.

L1 P-Code    (grün)	L1-Phase (schwarz)	Ungült.    Bereich	L1-Phasen-    sprung	L1 C/A-Code  (rot)
L2 Volle Phase (schwarz)	L2 P-Code         (grün)	L2-Phasen-                 sprung	L2 verschlüsselter          Code	L2 Halbe Phase  (dick schwarz)
Beachten Sie beim Auswerten von GPS-Beobachtungen folgende Richtlinien:

  Bei Einfrequenz-Beobachtungen werden SV-Verfolgungsinformationen für das L1-Trägersignal durch eine Folge von über die Zeitraum-Ansicht geplotteten Pixeln wiedergegeben.

  Bei Zweifrequenz-Beobachtungen werden SV-Verfolgungsinformationen für die L1- und L2-Trägersignale durch zwei parallele Folgen von über die Zeitraum-Ansicht geplotteten Pixeln wiedergegeben.

  Große Lücken zwischen SV-Verfolgungsplots geben Zeiträume wieder, in denen der Empfänger den Satelliten nicht verfolgt hat. Kleine Lücken zwischen Pixeln geben Phasensprünge und andere Verluste des Trägersignals wieder.

  Phasensprünge, ungültige Entfernungsdaten und andere Störquellen des Satellitensignals werden auch innerhalb des Pixelstrangs geplottet.

Stellen Sie sich jeden Pixel in einem SV-Verfolgungsplot als Platzhalter für Satellitenrohdaten vor, die zu einem bestimmten Zeitpunkt aufgezeichnet wurden. Diese Rohdaten enthalten:

  Beobachtungstyp − Phase, C/A-Code, P-Code usw.

  Signalverfügbarkeit − Wahr oder Falsch

  Signalstatus − Gültig, Nicht gültig, Phasensprung

  Status Aktiviert/Deaktiviert − Aktiviert/Deaktiviert-Marken

Diese Pixel verhalten sich wie Schalter mit einem Ein- und Aus-Zustand. Wird ein Pixel deaktiviert, werden auch die mit dem Pixel verbundenen Satellitenrohdaten deaktiviert. Wird ein Pixel aktiviert, werden auch die Satellitenrohdaten wieder verfügbar. Dadurch haben Sie die Möglichkeit, die Qualität der Daten beim Bearbeiten von GPS-Beobachtungsdaten zu verbessern. Sie können Datenbereiche deaktivieren und eine Basislinie neu berechnen, um zu sehen, ob sich die Qualität der Daten verbessert, und die Daten erneut aktivieren, wenn die Ergebnisse nicht erfolgreich waren.

Durch Auswahl kleiner Pixelbereiche (z. B. Pixelbereiche, die Phasensprünge enthalten)  können diese Bereiche bearbeitet werden, um die allgemeine Qualität von GPS-Beobachtungen zu verbessern.

TIP: Die Auswahl von Pixelbereichen erfolgt durch Ziehen eines Auswahlrechtecks um die problematischen Daten. Plazieren Sie einfach den Mauszeiger auf der linken oberen Ecke des Bereichs, den Sie deaktivieren möchten, halten Sie die linke Maustaste gedrückt, und ziehen Sie ein Rechteck um den betroffenen Bereich.

Um Daten des ausgewählten Pixelbereichs zu deaktivieren, doppelklicken Sie im Auswahlrechteck, um das Dialogfeld GPS-Beobachtungseigenschaften anzuzeigen. Neben anderen Hilfsmitteln enthält dieses Dialogfeld Optionen, um ausgewählte Satellitenrohdaten für einzelne Satelliten oder Gruppen von Satelliten zu deaktivieren und zu aktivieren. Weitere Informationen über das Auswählen und Bearbeiten von Timeline-Elementen finden Sie unter Timeline-Elemente wählen und bearbeiten.

Einige weitere Hilfsmittel stehen für die Arbeit mit dem Dialogfeld GPS-Beobachtungseigenschaften zur Verfügung. Diese beinhalten:

  Deaktivieren ausgewählter Satellitendaten für mehrere Satelliten

  Bearbeiten der Start- und Endzeiten von Satellitenbeobachtungsdaten

  Bearbeiten einzelner in der GPS-Beobachtung enthaltener Beobachtungstypen

Von der Steuerleiste aus können Sie ein Satelliten-Symbol deaktivieren, um alle damit verbundenen SV-Verfolgungsinformationen für eine GPS-Beobachtung aus einer Vermessung zu entfernen. Dies ist hilfreich, wenn der allgemeine Zustand aller mit einem Satelliten verbundenen GPS-Beobachtungen schlecht ist und die Satellitenkonstellation für die Besetzung ausreichend zusätzliche Daten enthält, um die Auslassung des deaktivierten Satelliten zu bewältigen. Weitere Informationen finden Sie unter Einen Satelliten deaktivieren.

TIP: Sie können sich über den Zustand der für einen ausgewählten Satelliten aufgezeichneten GPS-Beobachtungen informieren, indem Sie sich die Eigenschaften des letzten Ephemeriden-Symbols ansehen, das in den SV-Verfolgungsplots erscheint. Diese Aktualisierungen der Ephemeriden werden vom Empfänger in Intervallen von ca. 1 Stunde decodiert. Sie enthalten eine Meldung, die den aktuellen Zustand jedes Satelliten anzeigt. Die Felder URA und URA-Warnung sind ebenfalls hilfreich bei der Auswertung der allgemeinen Qualität von Satellitenübertragungen.

Sie können mit der rechten Maustaste irgendwo innerhalb des GPS-Beobachtungselements klicken, um ein Menü mit Befehlen zur Arbeit mit GPS-Beobachtungsdaten anzuzeigen.

GPS-Beobachtungen können nicht gelöscht werden, aber gesamte GPS-Beobachtungen oder ausgewählte Bereiche von GPS-Beobachtungen können deaktiviert werden. Satelliten können ebenfalls deaktiviert werden, um alle damit verbundenen Beobachtungstypen, die auf der Zeitlinie geplottet sind, zu deaktivieren.


Besetzungs/Datensegmentelemente
    Besetzungs-/Datensegment-Elemente

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Besetzungs- und Datensegment-Elemente stellen einen Zeitraum dar, in dem GPS-Beobachtungen von einem Empfänger aufgezeichnet wurden. Diese können in zwei Typen unterteilt werden:

  Statische Besetzungen, die FastStatic- und Stop-Go-Besetzungen einschließen. Eine Besetzung stellt einen Zeitraum dar, in dem sich ein Empfänger stationär an einem Punkt befindet.

  Kontinuierliche Segmente, die bewegte Segmente einschließen. Ein kontinuierliches oder ein bewegtes Segment stellt einen Zeitraum dar, in dem ein Empfänger bewegt wird, während er weiterhin Messungen aufzeichnet.

Farbcodierschema

Besetzungs- und Datensegment-Zeiträume werden durch farbcodierte rechteckige Bereiche dargestellt, die den Zeitraum anzeigen, über den die Besetzungsdaten aufgezeichnet wurden. Folgende Farbcodes und Formen werden verwendet, um verschiedenen Informationstypen zu identifizieren:

  Statische und FastStatic-Besetzungen erscheinen als große, blaue, rechteckige Bereiche.

  Stop &Go-Besetzungen erscheinen als kleine, blaue, rechteckige Bereiche.

  Kontinuierliche Segmente erscheinen als große, grüne, rechteckige Elemente.

  Bewegte Segmente erscheinen als kleine, grüne, rechteckige Elemente.

  Segmente mit Fehlern werden als rote Elemente dargestellt.

Plots der Satellitenkonstellation

Zwei Plots mit Informationen über die Satellitenkonstellation des Segments oder für die Besetzungszeit können angezeigt werden, wenn eine Besetzung oder ein Segment ausgewählt ist. Weitere Informationen finden Sie unter folgenden Themen:

  DOP-Plot

  Sky-Plot

Gepunktete Linien

Eine gepunktete Linie stellt Bereiche dar, in denen GPS-Messungen verfügbar sind, es aber keine mit diesen Messungen verknüpften Besetzungs- oder Segmentelemente gibt.

Bewegte Segmente werden nicht standardmäßig in die Datenbank importiert. Sie können nur durch Konvertieren eines kontinuierlichen Segments in ein bewegtes Segment erzeugt werden. Wenn die Daten aus einer DAT-Datei in Trimble Geomatics Office importiert werden, ist das Kontrollkästchen Verwenden für alle bewegten Elemente deaktiviert.

Bleibt das Kontrollkästchen deaktiviert, wird das bewegte Segment nicht in das Projekt geladen, und die gepunktete Linie zeigt an, daß es GPS-Messungen für diesen Zeitraum gibt, aber keine mit diesen Beobachtungen verbundenen Besetzungs- oder Segmentelemente vorhanden sind.

Wird das Kontrollkästchen aktiviert, wird das bewegte Segment in ein kontinuierliches Segment konvertiert, und ein kontinuierliches Segment wird in der Zeitlinie angezeigt. Ein bewegtes Segment kann nur erzeugt werden, indem ein kontinuierliches Segment in ein bewegtes Segment konvertiert wird.

Zusätzliche Richtlinien

Beachten Sie folgende Richtlinien bei der Arbeit mit Besetzungen und Datensegmenten:

  Alle Besetzungs- und Datensegmenteigenschaften können durch Doppelklicken auf die Besetzung oder das Datensegment angezeigt werden.

  Der Zeitraum kann direkt durch Ziehen der linken und rechten Seiten des Rechtecks verändert werden.

  Eine statische Besetzung kann in ein kontinuierliches oder bewegtes Segment geändert werden, indem der entsprechende Typ im Dialogfeld Besetzung/Datensegmenteigenschaften gewählt wird.

  Besetzungen und Segmente können gelöscht werden. Wenn sie jedoch einmal gelöscht sind, sind sie innerhalb des Projekts nicht mehr zugänglich.

  Die Befehle Nächste und Vorhergehend, die auch als blaue Pfeile in der Symbolleiste vorhanden sind, werden verwendet, um die Zeitraum-Ansicht zum nächsten oder vorherigen Start- oder Endpunkt der Beobachtung oder des Segments zu verschieben, der im aktiven Datenordner enthalten ist.


     Satelliten-Symbole

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Satelliten-Symbole stellen die Satelliten dar, die GPS-Messungen zur Vermessung beitragen. Die PRN-Nummer des Satelliten wird zur Identifizierung auf jedem Symbol angegeben.

Satelliten-Symbole sind ausgeblendet, wenn Timeline zum ersten Mal angezeigt wird. Um die Satelliten einzublenden, öffnen Sie einen oder mehrere Datenordner in der Steuerleiste.

Minuszeichen zeigt an: Ordner ist geöffnet

	Satelliten-Symbol
Die Satelliten-Symbole in der Steuerleiste entsprechen eins-zu-eins den in der Zeitraum-Ansicht angezeigten GPS-Beobachtungen. Das Symbol zeigt die Nummer des Satelliten, und die GPS-Beobachtungen zeigen die entsprechenden Zeiträume der Satellitenübertragungsaktivität an.

Klicken Sie mit der rechten Maustaste auf eines dieser Symbole, um ein Menü mit Befehlen anzuzeigen. Verwenden Sie den Befehl Aktivieren/Deaktivieren, um die Anzeige der zugewiesenen GPS-Beobachtungen in der Zeitraum-Ansicht zu aktivieren oder zu deaktivieren. Dieses Leistungsmerkmal ist hilfreich, um Satelliteninformationen aus einer Besetzung zu entfernen. Ist die Anzeige deaktiviert, werden die entsprechenden SV-Verfolgungsplots mit einer leichteren Schattierung farbcodiert, um ihren deaktivierten Status zu kennzeichnen. Wird der Befehl erneut gewählt, werden die SV-Verfolgungsinformationen erneut aktiviert. Verwenden Sie diesen Befehl, wenn der Zustand des Satelliten fraglich ist. Sie möchten z. B. evtl. einen ausgewählten Satelliten deaktivieren, um herauszufinden, ob sich die Ergebnisse der Basislinienverarbeitung dadurch verbessern.

TIP: Sie können auch ausgewählte Bereiche einer GPS-Beobachtung deaktivieren. Beispiel: Sie können einen Bereich deaktivieren, der Phasensprünge oder ungültige Entfernungsdaten enthält. Weitere Informationen finden Sie unter GPS-Beobachtungen.

Doppelklicken Sie auf ein Satelliten-Symbol, um das Fenster SV-Plot mit Befehlen für das Plotten aufgezeichneter Satellitenrohdaten anzuzeigen. Der SV-Plot bietet auch eine Option für das Exportieren von Satellitenrohdaten in tabellarischer Form in eine Datei.

Satelliten-Symbole können innerhalb eines Datenordners durch Ziehen der Symbole auf neue Positionen im Ordner neu angeordnet werden. Dies ist hilfreich, wenn mehrere Satelliten ausgewählt werden, bevor die Eigenschaften der GPS-Beobachtungen bearbeitet werden.


    Statische Besetzungen

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Statische Besetzungen stellen Zeiträume dar, in denen der Empfänger bei der Datenaufzeichnung stationär über einem Punkt verbleibt. Die aufgezeichneten Daten kennzeichnen die genaue Position des Punkts und die Zeit, zu der die Daten aufgezeichnet wurden.

Statische Besetzungen erscheinen als große blaue Rechtecke. Die Länge des Rechtecks stellt den Zeitraum dar, über den die Daten aufgezeichnet wurden. Ein Standpunkt-Symbol erscheint an der vorderen Kante der Besetzung, was darauf hinweist, daß es sich um eine statische Besetzung handelt.

Doppelklicken Sie auf eine statische Besetzung, um ihre Eigenschaften anzuzeigen. Diese Eigenschaften enthalten die Segment- und Antenneninformationen.

Sie können mit der rechten Maustaste überall innerhalb des statischen Besetzungselements klicken, um ein Menü mit Befehlen zur Arbeit mit Besetzungsdaten anzuzeigen.

Das statische Besetzungselement kann angepaßt werden, um den Zeitraum zu ändern. Statische Besetzungen können in ein kontinuierliches oder bewegtes Segment geändert werden, indem der entsprechende Typ aus der Liste Segmenttyp im Dialogfeld Besetzung/Datensegmenteigenschaften gewählt wird.

Da das Graphikfenster und Timeline miteinander verknüpft sind, werden die Besetzungen von Punkten und Basislinien, die im Graphikfenster ausgewählt werden, auch in Timeline ausgewählt, und umgekehrt. Beispiel: Sie können eine statische Besetzung in Timeline auswählen, um die zugeordneten Punkte und Basislinien im Graphikfenster anzusehen. Wenn die Punkte und Basislinien erst einmal ausgewählt sind, können Sie ihre Eigenschaften anzeigen, um mehr über die Besetzung zu erfahren.

Zwei Plots mit Informationen über die Satellitenkonstellation zur Besetzungszeit oder des Segments können angezeigt werden, wenn eine Besetzung ausgewählt ist. Weitere Informationen finden Sie unter folgenden Themen:

  DOP-Plot

  Sky-Plot

TIP: Das Eigenschaftsfenster, das vom Graphikfenster aus aufgerufen wird, ist auch hilfreich zur Navigation durch Timeline, um ausgewählte Besetzungen zu finden. Die Besetzungen von Basislinien und Punkten, die in diesem Dialogfeld ausgewählt werden, werden auch in Timeline ausgewählt. Wenn Sie ein Element ausgewählt haben, können Sie auf das Besetzungselement in Timeline doppelklicken, um seine Eigenschaften anzusehen.

Besetzungs- und Segmentelemente werden zur leichten Identifizierung in farbcodierten Rechtecken angezeigt. Weitere Informationen finden Sie unter Farbcodierschema für Besetzungen.


     Vermessungselemente

Weitere Informationen

Wie kann ich ...	Dialogfeld

Innerhalb der Zeitraum-Ansicht gibt es ein oder mehrere rechteckige Vermessungselemente, die einem Datenordner in der Steuerleiste zugeordnet sind. Jeder Datenordner stellt einen einzigen Empfänger dar und enthält Informationen für eine oder mehrere Vermessungen, die im Grunde Dateien mit GPS-Messungen sind.

Die vordere Kante eines Vermessungselements kennzeichnet die Startzeit, zu der die Vermessungssitzung begann, und die hintere Kante kennzeichnet die Endzeit. Wenn ein einziges Vermessungselement im Datenordner in der Steuerleiste enthalten ist, erstreckt sich dieses Vermessungselement über die gesamte Länge der Zeitlinie. Da zahlreiche über mehrere Tage aufgezeichnete Vermessungen in einem Projekt enthalten sein können, belegt ein Vermessungselement normalerweise nur einen kleinen Teil der gesamten Zeitlinie.

Sie können auf das Vermessungselement doppelklicken, um seine Eigenschaften anzuzeigen und zu bearbeiten.

Sie können mit der rechten Maustaste irgendwo innerhalb des Vermessungselements klicken, um ein Menü mit Befehlen zur Arbeit mit Vermessungsdaten anzuzeigen.

Vermessungselemente können gelöscht werden. Da Vermessungselemente tatsächliche Daten darstellen, werden auch die zugeordneten Daten aus dem Projekt gelöscht. Gelöschte Vermessungselemente erscheinen in der Zeitraum-Ansicht als weiße rechteckige Bereiche, eingerahmt von einer schwarzen Linie. Daraus können Sie entnehmen, daß es einmal Vermessungsdaten in diesem Bereich der Timeline gab.


Timeline-Elemente - Überblick
    Timeline-Elemente − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Timeline verwendet graphische Elemente, um die GPS-Vermessungsdaten in der Zeitraum-Ansicht wiederzugeben.

Datenordner		Vermessung	Ephemeriden-Symbol
Satelliten-Symbol		Besetzung	GPS-Beobachtung
Diese Elemente können gewählt und ihre zugeordneten Dateneigenschaften bearbeitet werden. Falls erforderlich, kann der Zeitraum der aufgezeichneten Daten bearbeitet werden, ausgewählte SV-Verfolgungsinformationen deaktiviert und Besetzungs- oder Vermessungselemente gelöscht werden. Alle Vorgänge, die auf diese Elemente angewendet werden, wirken sich auch auf die zugeordneten Projektdaten aus. Diese Vorgänge können die Qualität der Vermessungsdaten verbessern, wenn problematische Daten entfernt werden, die die allgemeine Qualität von GPS-Beobachtungen beeinflussen.

QuickInfos für Elemente

Die folgenden QuickInfos erscheinen, wenn der Mauszeiger über ein Timeline-Element geführt wird:

Wenn der Mauszeiger positioiniert wird über …	Zeigt die QuickInfo folgendes an …
einem Vermessungselement	den Namen der mit dem Element verknüpften Datendatei
einem Besetzungs- oder Datensegmentelement	den Namen des mit der Besetzung verknüpften Standpunkts
einer GPS-Beobachtung	die SV-Nummer, die mit den Verfolgungsinformationen verknüpft ist
einem Ephemeriden-Symbol	die SV-Nummer, die mit der Ephemeriden-Aktualisierung verknüpft ist
einem Satelliten-Symbol oder Datenordner	das Empfängermodell und die Seriennummer

Weitere Informationen über diese Elemente finden Sie unter folgenden Themen:

  Vermessungen

  Besetzungen

  Standpunkt-Symbole

  GPS-Beobachtungen

  Ephemeriden-Symbole

  Ereignis-Symbole


 Timeline-Symbolleisten

Weitere Informationen

 Siehe auch

Zwei Symbolleisten erscheinen, wenn der Ansichtsbereich der Timeline erscheint - die Timeline-Symbolleiste und die Symbolleiste Timeline-Plots. Diese beiden Symbolleisten bieten einen schnellen Zugriff auf häufig verwendete Timeline-Befehle.

Weitere Informationen über Symbolleisten in Timeline finden Sie unter folgenden Themen:

  Timeline-Symbolleiste

  Symbolleiste Timeline-Plots


Timeline-Ansichtsbereich - Überblick
    Timeline-Ansichtsbereich − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Timeline wird verfügbar, wenn Sie eine oder mehrere Dateien mit GPS-Messungen in Ihr Projekt in der Trimble Geomatics Office-Software importiert haben. Sie müssen sich außerdem in der Vermessungsansicht befinden.

So rufen Sie Timeline auf:

1.	Öffnen Sie ein Projekt, das GPS-Rohdateien enthält.

2.	Führen Sie einen der nachfolgenden Schritte aus:

  Wählen Sie Ansicht / Timeline.

  Drücken Sie Alt+AI.

Der Timeline-Ansichtsbereich erscheint am unteren Rand des Graphikfensters.

Die Zeitlinie ist in drei Bereiche unterteilt:

	Zeit-Lineal
Steuerleiste	Zeitraum-Ansicht

Diese drei Bereiche sind untereinander verknüpft. Das Zeit-Lineal bestimmt den Umfang zeitbezogener Vermessungsinformationen, die in der Zeitraum-Ansicht erscheinen, und die Steuerleiste bestimmt den Umfang der Satellitenrohinformationen, die in der Zeitraum-Ansicht erscheinen.

Stellen Sie sich die Zeitraum-Ansicht als ein Vergrößerungsglas vor. Sie kann die gesamte Zeitlinie anzeigen oder in kleinere Bereiche der Zeitlinie hineinzoomen oder dorthin  verschieben. Timeline bietet mehrere Optionen zum Zoomen und Verschieben der Informationen in der Zeitraum-Ansicht. Da Timeline und das Graphikfenster ebenfalls miteinander verknüpft sind, werden im Graphikfenster ausgewählte Daten auch in der Zeitraum-Ansicht ausgewählt.

Zwei weitere Dinge ändern sich, wenn Timeline aktiv ist. Zusätzliche Symbolleisten werden verfügbar und die Statusleiste zeigt Timeline-Informationen an.

Der Timeline-Ansichtsbereich kann im Hoch- oder Querformat ausgedruckt werden. Weitere Informationen finden Sie unter Den Timeline-Ansichtsbereich drucken.

Weitere Informationen über Timeline finden Sie unter folgenden Themen:

  Symbolleisten

  Zeit-Lineal

  Steuerleiste

  Zeitraum-Ansicht

  Timeline-Elemente


     Zeit-Lineal

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Das Zeit-Lineal und die Zeitraum-Ansicht sind untereinander verknüpft; jede Änderung im Zeitraum spiegelt sich in beiden Fenstern wieder.

Stellen Sie sich das Zeit-Lineal und die Zeitraum-Ansicht als ein Vergrößerungsglas vor. Sie können ausgewählte Bereiche der Zeitlinie in der Zeitraum-Ansicht zoomen oder auf sie verschieben. Die Zeitlinie kann sich von mehreren Stunden bis über mehrere Tage erstrecken und viele Besetzungen enthalten. Diese beiden Fenster arbeiten zusammen, um die gesamte Zeitlinie oder kleine Bereiche davon darzustellen. Jede Änderung im einen Fenster spiegelt sich im anderen wieder.

	Feld Startzeit	Feld Endzeit
	Lineal
Sie können die Felder Start- und Endzeit bearbeiten oder die Zeitraum-Ansicht zoomen, je nach Ihren augenblicklichen Anforderungen. Beachten Sie folgendes:

  Bearbeiten Sie die Felder Start- und Endzeit, um die Zeitraum-Ansicht zu vergrößern, wenn Sie die Beobachtungsdaten für bekannte Zeiträume untersuchen müssen. Beispiel: Sie möchten vielleicht einen Zeitraum vergrößern, in dem hohe Beobachtungsrestwerte dazu führten, daß eine Basislinienlösung zurückgewiesen wurde.

  Verwenden Sie den Befehl Zeitraum zoomen, wenn Sie ein bestimmtes Timeline-Element vergrößern müssen. Beispiel: Sie möchten vielleicht ein kontinuierliches kinematisches Segment so vergrößern, daß es die Zeitraum-Ansicht ausfüllt.

  Verwenden Sie den Befehl Zoom-Ausdehnung, wenn Sie die gesamte Zeitlinie in der Zeitraum-Ansicht anzeigen möchten. Dies ist hilfreich, wenn mehrere Dateien im Projekt enthalten sind, und Sie die verschiedenen Zeiträume, zu denen Vermessungsdaten aufgezeichnet wurden, zueinander in Beziehung setzen möchten.

  Verwenden Sie den Befehl Vergrößern, um die Daten in der Zeitraum-Ansicht in Schritten von 200% zu vergrößern. Dieser Befehl ist hilfreich, wenn Sie einen kleinen Ausschnitt einer GPS-Beobachtung vergrößern möchten, um Lücken in den Übertragungen der SV-Verfolgung oder Phasensprünge zu sehen.

  Verwenden Sie den Befehl Verkleinern, um die Daten in der Zeitraum-Ansicht in Schritten von 50% zu verkleinern. Verwenden Sie diesen Befehl, wenn Sie mehr vom GPS-Beobachtungsbereich ansehen müssen. Dies ist hilfreich, wenn Sie herausfinden möchten, ob ein Satellit deaktiviert werden kann oder nicht. Sie müssen dazu vielleicht wissen, ob es genügend Redundanz in der Satellitenkonstellation gibt, um den Satelliten zu deaktivieren. Durch Verkleinern können Sie feststellen, wie viele Satelliten im entsprechenden Zeitraum verfolgt wurden.

  Verwenden Sie den Befehl Vorherige Ansicht, um zur vorherigen Vergrößerung zurückzuschalten. Dieser Befehl ist hilfreich, um zu einer vorherigen Vergrößerung zurückzukehren, nachdem Sie eine Besetzung oder GPS-Beobachtung vergrößert oder verkleinert haben.

Das Zeit-Lineal kann zwei Arten von Zeiteinheiten darstellen:

  Windows-Ortszeit

  GPS-Wochen/Sekunden

Sie können das Dialogfeld Optionen Zeitanzeige anzeigen, um die Einheiten zu ändern. Verwenden Sie die örtliche Windows-Zeit, wenn es einfacher ist, Zeiträume auf tägliche Zeitperioden, wie Kalenderdaten oder die Ortszeit zu beziehen. Verwenden Sie die Option GPS-Woche/Sekunden, wenn Sie Ihre Zeiträume auf GPS-Ereignisse oder -Daten in beziehen müssen. Sie können schnell mit wenigen Mausklicks zwischen den Zeiteinheiten wechseln.

Änderungen in den Zeiteinheiten spiegeln sich in allen Eigenschaftsdialogfeldern und Anzeigen in Timeline wieder.

Sie können mit der rechten Maustaste auf das Zeit-Lineal klicken, um ein Menü mit Befehlen zur Arbeit mit dem Zeit-Lineal anzuzeigen.

Weitere Informationen finden Sie unter folgenden Themen:

  Symbolleisten

  Steuerleiste

  Zeitraum-Ansicht

  Timeline-Elemente

  Timeline Eigenschaftsdialogfelder

  Timeline-Anzeigen


     Standpunkt-Symbole

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diese kleinen, roten, dreieckigen Symbole und Beschriftungen, um statische Beobachtungen zu identifizieren.

HINWEIS: Standpunkt-Symbole können nicht gelöscht oder deaktiviert werden - sie werden nur als Teil ihrer Besetzung gelöscht oder deaktiviert.


     Ereignis-Symbole

Weitere Informationen

Wie kann ich ...	Siehe auch

Diese Symbole kennzeichnen sowohl vom System als auch manuell erzeugte Ereignisse, die während der Aufzeichnung von Vermessungsdaten auftraten. Ereignis-Symbole erscheinen nur in der Zeitraum-Ansicht und werden als Raute angezeigt, zentriert auf dem Zeitpunkt, an dem das Ereignis aufgetreten ist.

Ereignis-Symbole können durch Klicken auf [image] in der Symbolleiste der Timeline gefiltert werden, um Symbole ein- oder auszublenden.


Timeline-Menüs - Überblick
 Timeline-Menüs − Überblick

Weitere Informationen

Überblick

Die Timeline-Menüs können verwendet werden, um schnell Zugriff auf die Befehle innerhalb des Timeline-Ansichtsbereichs zu erhalten. Alle Menüs erscheinen, wenn ein Element oder Fenster in Timeline gewählt ist, und mit der rechten Maustaste geklickt wird.

Folgende Menüs sind verfügbar:

  Zeit-Lineal

  Zeitraum-Felder

  Datenordner

  GPS-Beobachtung

  Zeitraum-Ansicht

  Vermessung

  Besetzung

  Satelliten-Symbole

  Ephemeriden-Symbole


     Menü Zeit-Lineal

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf die Befehle des Zeit-Lineals zuzugreifen.

Führen Sie hierzu einen der folgenden Schritte aus:

  Doppelklicken Sie auf den Hintergrund des Zeit-Lineals

  Klicken Sie mit der rechten Maustaste auf den Hintergrund des Zeit-Lineals

Ein Menü mit folgenden Befehlen erscheint:

  Zeitoptionen

  Zoom-Ausdehnung

  Vorherige Ansicht


     Menü Zeitraum-Felder

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf die Befehle der Zeitraum-Felder zuzugreifen.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf das Zeitraum-Feld Startzeit oder Endzeit.

Ein Menü mit folgenden Befehlen erscheint:

  Rückgängig

  Ausschneiden

  Kopieren

  Einfügen

  Löschen

  Alles markieren


     Menü Steuerleiste

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf die Befehle der Steuerleiste zuzugreifen. Der Timeline-Ansichtsbereich muß sichtbar sein, damit auf dieses Menü zugegriffen werden kann.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste irgendwo in der Steuerleiste.

Ein Menü mit folgenden Befehlen erscheint:

  Alle expandieren

  Alle reduzieren

  Zoom-Ausdehnung

  Vorherige Ansicht


     Menü Satelliten-Symbol

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf die Befehle des Satelliten-Symbols zuzugreifen.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf das Satelliten-Symbol.

Ein Menü mit folgenden Befehlen erscheint:

  Aktivieren/Deaktivieren

  SV-Plot


     Menü Zeitraum-Ansicht

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf die Befehle der Zeitraum-Ansicht zuzugreifen.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf den Hintergrund der Zeitraum-Ansicht.

Ein Menü mit folgenden Befehlen erscheint:

  Ansicht Filter

  Nächste

  Vorherige

  Zoom-Ausdehnung

  Vorherige Ansicht


     Menü Vermessung

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf Befehle des Vermessungsintervalls zuzugreifen.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf ein Vermessungselement.

Ein Menü mit folgenden Befehlen erscheint:

  Löschen

  Ephemeriden-Info

  Zeitraum zoomen

  Zoom-Ausdehnung

  Vorherige Ansicht

  Eigenschaften


     Menü Statische Besetzung

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf Befehle für statische Besetzungen zuzugreifen.

HINWEIS: Die statische Besetzung muß in der Zeitraum-Ansicht sichtbar sein, damit auf dieses Menü zugegriffen werden kann. Zeigen Sie zuerst Timeline an, und öffnen Sie dann den Datenordner, der die Besetzungsdaten enthält.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf ein statisches Besetzungselement.

Ein Menü mit folgenden Befehlen erscheint:

  Löschen

  Ephemeriden-Info

  Zeitraum zoomen

  Zoom-Ausdehnung

  Vorherige Ansicht

  Eigenschaften


     Menü GPS-Beobachtung

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf Befehle für GPS-Beobachtungen zuzugreifen.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf eine GPS-Beobachtung oder auf ein Auswahlrechteck, das einen Bereich einer GPS-Beobachtung enthält.

Ein Menü mit folgenden Befehlen erscheint:

  Aktivieren/Deaktivieren

  Ephemeriden-Info

  Zeitraum zoomen

  Zoom-Ausdehnung

  Vorherige Ansicht

  Eigenschaften


     Menü Ephemeriden

Weitere Informationen

 Siehe auch

Verwenden Sie dieses Menü, um schnell auf Befehle zur Arbeit mit Ephemeriden-Informationen zuzugreifen:

So greifen Sie darauf zu:

1.	Öffnen Sie einen Ordner, falls erforderlich.

Der Ordner wird geöffnet und zeigt die Satelliten-Symbole an.

2.	Aktivieren Sie den Satelliten-Filter, falls erforderlich.

Die GPS-Beobachtungen erscheinen.

Der Satelliten-Filter ist standardmäßig aktiviert.

3.	Aktivieren Sie den Ephemeriden-Filter, falls erforderlich.

Die Ephemeriden-Symbole erscheinen.

4.	Klicken Sie mit der rechten Maustaste auf das gewünschte Ephemeriden-Symbol.

Ein Menü mit folgenden Befehlen erscheint:

  Zeitraum zoomen

  Zoom-Ausdehnung

  Vorherige Ansicht

  Eigenschaften


     Datenordner

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Ein Datenordner stellt einen einzelnen Empfänger dar. Der Typ und die Seriennummer des dargestellten Empfängers werden auf dem Ordner angezeigt. Vermessungsprojekte haben mehr als einen Ordner, einen für jeden im Projekt verwendeten Empfänger.

Jeder Datenordner enthält Informationen über eine oder mehrere Vermessungen. Eine Vermessung entspricht einer einzelnen Datei mit GPS-Messungen.

Öffnen und schließen Sie Datenordner, um die Satelliten-Symbole in der Steuerleiste und die zugeordneten GPS-Beobachtungen in der Zeitraum-Ansicht ein- und auszublenden.

Pluszeichen zeigt an: Ordner ist geschlossen
	Empfängermodell und Seriennummer
Minuszeichen zeigt an: Ordner ist geöffnet

	Satelliten-Symbol

Sie können Datenordner auf zwei Arten öffnen und schließen:

  Ein Pluszeichen (+) erscheint auf der linken Seite eines geschlossenen Datenordners und ein Minuszeichen (–) erscheint, wenn er geöffnet ist. Sie können auf die Plus-(+)- und Minus-(–)-Symbole klicken, um einzelne Ordner zu öffnen und zu schließen.

  Die Befehle Alle expandieren und Alle reduzieren sind auf mehrere Arten verfügbar, um alle Datenordner in der Steuerleiste zu öffnen oder zu schließen.

Ist ein Odner geöffnet, erscheint ein Satelliten-Symbol für jeden Satelliten, der GPS-Beobachtungen zur Vermessung beiträgt; für jedes Symbol erscheinen GPS-Beobachtungen in der Zeitraum-Ansicht, wiedergegeben durch SV-Verfolgungsplots.

  Bei Einfrequenz-Beobachtungen werden SV-Verfolgungsinformationen für das L1-Trägersignal als eine Folge von Pixeln, geplottet über die Zeitraum-Ansicht, wiedergegeben.

  Bei Zweifrequenz-Beobachtungen werden SV-Verfolgungsinformationen für die L1- und L2-Trägersignale als zwei parallele Folgen von Pixeln, geplottet über die Zeitraum-Ansicht, wiedergegeben.

Empfänger-Informationen werden angezeigt, wenn Sie auf einen Datenordner doppelklicken. Wenn Sie mit der rechten Maustaste auf einen Ordner klicken, wird ein Menü mit Befehlen zur Arbeit mit den Daten im Ordner angezeigt.

Mehrere Vorgänge können mit den Satelliten-Symbolen und GPS-Beobachtungen ausgeführt werden, die erscheinen, wenn ein Datenordner geöffnet wird. Abbildungen der verschiedenen Timeline-Elemente in der Steuerleiste und der Zeitraum-Ansicht finden Sie unter Timeline-Elemente.


     Timeline-Steuerleiste

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie die Steuerleiste, um die in der Zeitraum-Ansicht angezeigten Informationen für GPS-Beobachtungen zu verwalten.

Die Steuerleiste befindet sich in der linken unteren Ecke des Timeline-Ansichtsbereichs.  In der Steuerleiste ausgeführte Vorgänge spiegeln sich in der Zeitraum-Ansicht wieder.

In der Steuerleiste können Sie folgende Vorgänge ausführen:

  Datenordner öffnen und schließen

  Satelliten-Symbole und ihre entsprechenden GPS-Beobachtungen aktivieren und deaktivieren

  Empfänger-Eigenschaften anzeigen

  Einen SV-Plot anzeigen, um die von den einzelnen Satelliten übertragenen SV-Verfolgungsrohdaten anzusehen

Verwenden Sie das Menü der Steuerleiste, um auf Befehle zuzugreifen, die mit den aktuell in Timeline angezeigten Daten verbunden sind. Das Menü Satelliten-Symbol ist hilfreich, um mit einzelnen Satelliten verbundene GPS-Beobachtungen zu aktivieren und zu deaktivieren. Verwenden Sie es auch, um den SV-Plot anzuzeigen, der Optionen für das Plotten von SV-Verfolgungrohdaten für einzelne Satelliten enthält.

Weitere Informationen finden Sie unter folgenden Themen:

  Symbolleisten

  Zeit-Lineal

  Zeitraum-Ansicht


     Menü Kontinuierliches Segment

Weitere Informationen

 Siehe auch

Öffnen Sie dieses Menü, um schnell auf Befehle für kontinuierliche Segmente zuzugreifen.

HINWEIS: Das kontinuierliche Segment muß in der Zeitraum-Ansicht sichtbar sein, damit auf dieses Menü zugegriffen weden kann. Zeigen Sie zuerst Timeline an, öffnen Sie dann den Datenordner, der die kontinuierlichen Daten enthält.

So greifen Sie darauf zu:

  Klicken Sie mit der rechten Maustaste auf ein kontinuierliches Segment.

Ein Menü mit folgenden Befehlen erscheint:

  Löschen

  Ephemeriden-Info

  Zeitraum zoomen

  Zoom-Ausdehnung

  Vorherige Ansicht

  Eigenschaften


     Timeline-Symbolleiste

Weitere Informationen

 Siehe auch

Diese Symbolleiste erscheint im Bereich für die Symbolleisten, wenn Timeline erscheint.

Die Symbolleiste erscheint automatisch, wenn Timeline gestartet wird. Sie können die Symbolleiste durch Wählen von Ansicht / Symbolleisten / Timeline ausblenden und sie durch nochmaliges Ausführen dieses Befehls wieder einblenden.

Folgende Schaltflächen sind verfügbar:

	Wählen Sie diese Schaltfläche, um die roten dreieckigen Standpunkt-Symbole und Beschriftungen, die mit Besetzungen verbunden sind, zu filtern. Standpunkte erscheinen in der Zeitraum-Ansicht an der vorderen Kante oder am Startpunkt eines Besetzungselements. Wenn Sie auf ein Standpunkt-Symbol doppelklicken, erscheinen die Eigenschaften dieses Standpunkts mit zusammenfassenden Informationen über den Standpunkt.
	Wählen Sie diese Schaltfläche, um die rautenförmigen Ereignis-Symbole in der Zeitraum-Ansicht zu filtern.
	Wählen Sie diese Schaltfläche, um kontinuierliche Segmente zu filtern. Diese Segmente werden von bewegten Empfängern (Rovern) aufgezeichnet und haben keine anfänglich zugewiesene Standpunkte. Klicken Sie einmal auf diese Schaltfläche, um die Segmente auszublenden, und klicken Sie erneut darauf, wenn Sie sie anzeigen möchten.
	Wählen Sie diese Schaltfläche, um die von Satelliten aufgezeichneten GPS-Beobachtungen zu filtern. Klicken Sie einmal auf diese Schaltfläche, um alle GPS-Beobachtungen auszublenden, und klicken Sie erneut darauf, wenn Sie sie anzeigen möchten.
	Wählen Sie diese Schaltfläche, um die Ephemeriden-Symbole in der Zeitraum-Ansicht zu filtern. Klicken Sie einmal auf die Schaltfläche, um die Symbole anzuzeigen, und klicken Sie erneut darauf, wenn Sie sie wieder ausblenden möchten.
	Wählen Sie diese Schaltfläche, um alle geschlossenen Datenordner in der Steuerleiste zu öffnen. Die Satelliten-Symbole und GPS-Beobachtungen für alle Satelliten in den Datenordnern werden sichtbar, wenn Sie diese Schaltfläche betätigen.
	Wählen Sie diese Schaltfläche, um alle geöffneten Datenordner in der Steuerleiste zu schließen. Die Satelliten-Symbole und GPS-Beobachtungen für alle Satelliten in den Datenordnern werden ausgeblendet, wenn Sie diese Schaltfläche betätigen.
	Wählen Sie diese Schaltfläche, um die Zeitraum-Ansicht zum vorherigen Vermessungselement zu verschieben. Diese Schaltfläche ist nur verfügbar, wenn ein Datenordner ausgewählt ist. Jedesmal, wenn diese Schaltfläche betätigt wird, wird das vorherige Vermessungselement gewählt. Diese Schaltfläche ist besonders hilfreich zum schnellen Verschieben von Vermessung zu Vermessung, ohne die Bildlaufleisten zu verwenden.
	Wählen Sie diese Schaltfläche, um die Zeitraum-Ansicht zum nächsten Vermessungselement zu verschieben. Diese Schaltfläche ist nur verfügbar, wenn ein Datenordner ausgewählt ist. Jedesmal, wenn diese Schaltfläche betätigt wird, wird das nächste Vermessungselement gewählt. Diese Schaltfläche ist besonders hilfreich zum schnellen Verschieben von Vermessung zu Vermessung, ohne die Bildlaufleisten zu verwenden.


     Symbolleiste Timeline-Plots

Weitere Informationen

 Siehe auch

Verwenden Sie diese Symbolleiste, um Befehle für die Anzeige von Satellitenrohdaten und Broadcast-Ephemeriden-Informationen auszuführen.

Diese Symbolleiste erscheint automatisch, wenn Timeline gestartet wird. Sie können die Symbolleiste durch Wählen von Ansicht / Symbolleisten / Timeline-Plots ausblenden und sie durch nochmaliges Ausführen dieses Befehls wieder einblenden.

Folgende Schaltflächen sind verfügbar:

	Wählen Sie diese Schaltfläche, um den DOP-Plot anzuzeigen. Diese Schaltfläche ist nur verfügbar, wenn eine Besetzung ausgewählt ist.
	Wählen Sie diese Schaltfläche, um den Sky-Plot für eine Besetzung anzuzeigen. Diese Schaltfläche ist nur verfügbar, wenn eine Besetzung ausgewählt ist.
	Wählen Sie diese Schaltfläche, um den SV-Plot für einen ausgewählten Satelliten anzuzeigen. Diese Schaltfläche ist nur verfügbar, wenn ein Satelliten-Symbol aus einem Datenordner gewählt ist.


     Zeitraum-Felder

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie die Felder Start- Endzeit im Zeit-Lineal, um die Zeitraum-Ansicht zu einem ausgewählten Zeitraum zu verschieben.

Bearbeiten Sie die Felder Start- und Endzeit, um die Zeitraum-Ansicht zu verschieben, wenn Sie die Beobachtungsdaten für bekannte Zeiträume untersuchen müssen. Beispiel: Sie möchten die Anzeige vielleicht zu einem Zeitraum verschieben, in dem sich ein bestimmter Standpunkt auf der Zeitlinie befindet.

Während Sie diese Felder bearbeiten, können Sie mit der rechten Maustaste auf diese Felder klicken, um ein Menü anzuzeigen und die Befehle für die Zwischenablage verwenden, um Text auszuschneiden, zu kopieren, einzufügen und zurückzusetzen.


Plots der Satellitenkonstellation - Überblick
     Plots der Satellitenkonstellation − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch

Überblick

Timeline kann graphische Anzeigen mit Informationen über die Satellitenkonstellation erzeugen. Diese Anzeigen basieren auf den zur Zeit der Besetzung gültigen Ephemeriden-Informationen.

Die Anzeigen sind:

  DOP-Plot

  Sky-Plot

Diese Anzeigen sind nur verfügbar, wenn ein Besetzungselement gewählt ist. Eine Besetzung wird benötigt, um die Koordinaten eines Punkts zu erhalten, aus denen die Sichtbarkeit der Satelliten berechnet wird.


     DOP-Plot

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie den DOP-Plot, um die Anzahl der Satelliten und die Dilution of Precision (DOP), ein Maß für die erwartete Qualität der GPS-Position, basierend auf der Satellitengeometrie über den Beobachtungszeitraum, zu erhalten. Die zur Ableitung dieser Anzeige verwendeten Informationen basieren auf den während der Besetzungszeit gültigen Ephemeriden-Informationen.

Führen Sie einen der nachfolgenden Schritte aus, um den DOP-Plot für eine Besetzung anzuzeigen:

  Klicken Sie mit der rechten Maustaste auf die Besetzung in Timeline, und wählen Sie Ephemeriden-Info / DOP-Plot.

  Klicken Sie in der Symbolleiste Timeline-Plots auf [image].

Der DOP-Plot wird angezeigt.

DOP ist ein skalares Maß der Qualität der Geometrie der Satellitenkonstellation. Niedrigere DOP-Werte weisen auf eine bessere Geometrie hin und höhere Werte auf eine schlechtere Geometrie. Im allgemeinen ist der DOP-Wert niedriger und die Geometrie besser, je mehr Satelliten beobachtet werden. Der Anzahl der Satelliten-Plots zeigt die Anzahl der verfolgten Satelliten im jeweiligen Beobachtungszeitraum an.

Die Tageszeit und Ihre Position beeinflussen den DOP. Da Zeiträume mit niedrigem DOP und guter Satellitengeometrie mit Plan-Software vorausgesagt werden können, ist es möglich, Beobachtungen für Tageszeiten einzuplanen, an denen die Bedingungen am günstigsten sind.

HINWEIS: Die Berechnungen der Anzahl der Satelliten und der DOP-Wert basieren nur auf den Ephemeriden, die zur Zeit der Besetzung gültig waren. Diese Anzeigen reflektieren nicht notwendigerweise tatsächliche Verfolgungsbedingungen und können mehr Satelliten anzeigen als tatsächlich verfolgt werden. Dies kann verursacht werden durch Sichteinschränkungen vor Ort, die nicht einbezogen werden können, wenn diese Anzeigen erstellt werden.


     Sky-Plot

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie diese Anzeige, um die örtlichen zweidimensionalen (Horizont-) Plots der Satellitenkonstellation anzuzeigen, die vom ausgewählten Standort sichtbar ist. Die Informationen, die zur Ableitung des Sky-Plots verwendet wurden, basieren auf den Ephemeriden-Informationen, die zur Zeit der Besetzung gültig waren.

Führen Sie einen der nachfolgenden Schritte aus, um den Sky-Plot anzuzeigen:

  Klicken Sie mit der rechten Maustaste auf die Besetzung in Timeline, und wählen Sie Ephemeriden-Info / Sky-Plot.

  Klicken Sie auf der Symbolleiste Timeline-Plots auf [image].

Der örtliche Horizont des Sky-Plots wird angezeigt in Abgängigkeit von Azimut und orthometrischer Höhe.

Bewegen Sie den Mauszeiger über den Plot, um die SV-Verfolgungsdaten in der Statusleiste anzuzeigen. Die Statusleiste identifiziert den Satelliten und zeigt Zeit, Azimut und Höhe des Datenpunkts an, der dem Mauszeiger am nächsten ist.

Am Anfang der Besetzung wird die anfängliche Satellitenkonstellation mit kleinen Quadraten um die Datenpunkte hervorgehoben. Für diesen Zeitpunkt werden die Anzahl der Satelliten und die DOP-Werte angezeigt. Sie können diese Daten aktualisieren.

HINWEIS: Der Sky-Plot basiert nur auf den Ephemeriden, die zur Zeit der Besetzung gültig waren. Diese Anzeige reflektiert nicht notwendigerweise tatsächliche Verfolgungsbedingungen und kann mehr Satelliten anzeigen als tatsächlich verfolgt werden. Dies kann verursacht werden durch Sichteinschränkungen vor Ort, die nicht einbezogen werden können, wenn diese Anzeigen erstellt werden.


     Inhalt Timeline

Inhalt

Die folgenden Hilfethemen sind verfügbar:

Lesen Sie sich die folgenden Themen durch, um sich mit Timeline vertraut zu machen:

  Wann und warum Timeline zu verwenden ist

  Timeline-Ansichtsbereich

  Timeline-Elemente

  Timeline-Eigenschaftsdialogfelder

  Timeline-Menüs

  Timeline-Befehle

  Timeline-Satelliten- und Ephemeridenanzeigen

Für Hilfe bezüglich des Hilfeprogramms betätigen Sie F1.


Timeline - Überblick
    Timeline − Überblick

Weitere Informationen

Dialogfeld	Siehe auch
Überblick

Timeline zeigt GPS-Projektinformationen (z. B.  die von Trimble-Empfängern oder Datenrekordern aufgezeichnete Satelliten- und Vermessungsrohinformationen) in einem graphischen Zeitformat an. Alle Informationen werden mit Hilfe graphischer Elemente an der entsprechenden Position auf einer Zeitlinie dargestellt. Timeline ist nur in der Planansicht verfügbar.

So greifen Sie darauf zu:

  Wählen Sie Ansicht / Timeline.

Verwenden Sie Timeline, um:

  detaillierte Plots für Satellitenbeobachtungen anzusehen

  ausgewählte Satellitendaten zu deaktivieren

  fehlerhafte GPS-Beobachtungsdaten selektiv zu bearbeiten

  die mit Elementen verknüpften Dateneigenschaften zu bearbeiten

  die bei der Basislinienverarbeitung verwendeten Besetzungszeiten zu ändern

Sobald Timeline erscheint, können Sie graphische Elemente auswählen, um die mit diesen Elementen verknüpften Daten zu ermitteln, zu überprüfen und zu bearbeiten.

Weitere Informationen finden Sie unter folgenden Themen:

  Wann und warum Timeline zu verwenden ist

  Timeline-Ansichtsbereich

  Timeline-Elemente

  Timeline-Eigenschaftsdialogfelder

  Timeline-Satelliten- und Ephemeridenanzeigen


     Wann und warum Timeline zu verwenden ist

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie Timeline, um GPS-Projektinformationen zu überprüfen, zu bestätigen und zu bearbeiten. Sie können Timeline einsetzen, nachdem Sie GPS-Rohdateien in Ihr Trimble Geomatics Office Software-Projekt übertragen haben. Falls Sie die in den Dateien aufgezeichneten GPS-Daten vor der Verarbeitung von Basislinien überprüfen oder Antenneninformationen bearbeiten möchten, verwenden Sie Timeline zur Datenüberprüfung. Timeline ist im Anschluß an die Basislinienverarbeitung von großem Nutzen, wenn bei der Verarbeitung unerwartete Resultate aufgetreten sind. Sie können Timeline verwenden, um problematische Daten zu finden und zu bearbeiten und die  Datenqualität zu verbessern.

Verwenden Sie Timeline, um GPS-Vermessungsinformationen auf folgende Bedingungen zu überprüfen:

  Phasensprünge im Satellitensignal und andere Signalprobleme

  Schlechte Satellitengesundheit

  Schlechte Redundanz in Satellitenkonstellationen

  Zeiträume mit schlechtem DOP (Dilution of Precision)

  Antennenmeßprobleme

  Zeitberechnungsprobleme bei mehreren Vermessungsdateien

Verwenden Sie Timeline, um folgende Tests durchzuführen:

  Ändern Sie Datenaufzeichnungszeitspannen

  Deaktivieren und aktivieren Sie Satellitenverfolgungsinformationen

Verwenden Sie die Timeline-Befehle, um die Datenqualität zu verbessern:

  Ändern Sie die Besetzungszeiten

  Deaktivieren Sie ungesunde Satelliten, um die allgemeinen Beobachtungsrestwerte zu verbessern

  Bearbeiten Sie fehlerhafte GPS-Beobachtungsdaten selektiv

  Entfernen Sie problematische Besetzungen aus der Basislinienverarbeitung

  Entfernen Sie problematische Vermessungsdateien aus der Basislinienverarbeitung

Timeline organisiert alle Dateien mit GPS-Messungen eines einzelnen Empfängers in einem Datenordner. Es zeigt zudem Informationen über jede GPS-Meßdatei unter Verwendung von Vermessungselementen an. Jeder Empfänger hat seinen eigenen separaten Datenordner; alle in einer bestimmten Reihe angezeigten Vermessungselemente stammen vom selben Empfänger.

Vermessungselemente werden für den Zeitraum angezeigt, über den die Daten aufgezeichnet wurden. Die Datenordner für jeden Empfänger können geöffnet werden, um zusätzliche Informationen zu erhalten; alle bei der Vermessung aufgezeichneten Daten können dargestellt werden.

Verwenden Sie die Maus, um durch die Zeitraum-Ansicht zu navigieren, und wählen Sie dann Elemente, um diese anzusehen oder ihre Dateneigenschaften zu bearbeiten. Timeline Satelliteninformationen und Ephemeridenanzeigen können verwendet werden, um die Daten in größerem Detail anzusehen oder zu bearbeiten.

Wenn Sie Timeline verwenden, können Sie weiterhin im Graphikfenster arbeiten. Diese beiden Ansichten sind miteinander verknüpft—Datenauswahlvorgänge und Datenänderungen, die in einem Ansichtsbereich durchgeführt werden, werden ebenso in dem anderen Ansichtsbereich durchgeführt. Weitere Informationen über die Verwendung dieser beiden Ansichten finden Sie unter Timeline-Elemente wählen und bearbeiten.


     Timeline-Elemente wählen und bearbeiten

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Da das Graphikfenster und Timeline miteinander verknüpft sind, können Sie die folgenden Vorgänge durchführen:

  Wählen Sie Timeline-Besetzungselemente, und sehen Sie sich den gewählten Punkt im Graphikfenster an.

  Wählen Sie eine Basislinie im Graphikfenster, und sehen Sie sich die in Timeline hervorgehobenen Besetzungssegmente an, die die Basislinie bilden.

  Wählen Sie einen Punkt in dem Graphikfenster, und sehen Sie sich die damit verknüpften Segmente an, die in Timeline hervorgehoben sind.

HINWEIS: Wenn die Ansicht unabhängiger Basislinien aktiviert ist, werden im Graphikfenster nur Beobachtungen angezeigt, die auch in der Timeline-Ansicht angezeigt werden. Dies ist nützlich bei der Auswahl unabhängiger Basislinien. So aktivieren Sie die Ansicht unabhängiger Basislinien:

1.	Wählen Sie Ansicht / Filter. Das Dialogfeld Ansicht Filter erscheint.

2.	Wählen Sie die Option "Timeline verwenden, um abhängige Basislinien anzuzeigen", und klicken Sie auf OK.

Verwenden Sie die Symbolleiste Timeline-Plots, um folgende detaillierte Plots und Grafiken anzuzeigen:

  DOP und die Anzahl der SV-Plots für eine Standpunktbesetzung

  Sky-Plots von Satelliten für eine Standpunktbesetzung

  Satellitenrohdaten-Plots für eine Sitzung

Verwenden Sie diese Plots und Grafiken, um:

  den Zeitraum für die angezeigten Daten zu ändern

  eine oder mehrere Anzeigen zur gleichen Zeit zu öffnen, um die Informationen in verschiedenen Formaten anzusehen

  die Größe der Fenster zu ändern und diese neu anzuordnen, um die Daten zu überprüfen

  die Plots und Grafiken zu drucken

Die Plots und Grafiken werden in den folgenden Abschnitten beschrieben.

Elementauswahl

Fünf Vorgänge sind mit der Auswahl von Timeline-Elementen und den entsprechenden Projektdaten verknüpft:

  Klicken Sie einmal auf ein Element, um die mit dem Element verknüpften Daten zu wählen

  Doppelklicken Sie auf ein Element, um seine Informationseigenschaften anzusehen

  Klicken Sie mit der rechten Maustaste auf ein Element, um ein Menü mit Befehlen für die Bearbeitung des Elements anzusehen

  Ziehen Sie ein Auswahlrechteck um ein Element oder mehrere Elemente, bevor Sie deren Eigenschaften ansehen oder die mit dem Element verknüpften Daten deaktivieren oder löschen

  Verwenden Sie Vorgänge mit Umschalt-Klicken oder Strg-Klicken, um zufällige Elementauswahlen zu treffen

Der Auswahlvorgang eines Elements ist derselbe wie der Auswahlvorgang für die mit dem Element verknüpften Projektdaten.

Vorgänge rückgängig machen

Der Befehl Rückgängig der Trimble Geomatics Office Software kann verwendet werden, um einige Timeline-Vorgänge abzubrechen, z. B. das Löschen und Deaktivieren von Elementen. Wenn ein Timeline-Element deaktiviert oder gelöscht wird, wird sein ursprünglicher Elementzustand in der Zwischenablage plaziert. Die Wahl des Befehls Rückgängig kehrt den Lösch- oder Deaktivierungsvorgang um.

HINWEIS: Der Lösch- oder Deaktivierungsvorgang kann nicht rückgängig gemacht werden, wenn ein anderer Befehl die Daten in der Zwischenablage überschreibt.

Der Befehl Rückgängig ist auch verfügbar, wenn die Felder Startzeit und Endzeit bearbeitet werden. Sie können Text aus einem Feld ausschneiden oder kopieren und in das andere Feld einfügen.

Element-QuickInfos lesen

Diese QuickInfo erscheint, wenn der Mauszeiger über einem Timeline-Element plaziert wird:

Wenn der Mauszeiger positioniert wird über …	Zeigt eine QuickInfo folgendes an…
einem Vermessungselement	den Namen der mit dem Vermessungselement verknüpften Datei
einem Besetzungs- oder Datensegmentelement	den Namen des mit einer Besetzung verknüpften Standpunkts
einer GPS-Beobachtung	die mit den Verfolgungsinformationen verknüpfte SV-Nummer
einem Ephemeriden-Symbol	die mit den Verfolgungsinformationen verknüpfte Ephemeriden-Aktualisierung
einem Satelliten-Symbol oder einem Datenordner	das Empfängermodell und die Seriennummer


     Satellitenverfolgungsinformationen bearbeiten

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Verwenden Sie das Dialogfeld GPS-Beobachtungseigenschaften, um eine Reihe von Satellitenbeobachtungen zu bearbeiten, und diese Bearbeitungen auf die Basislinienverarbeitung anzuwenden. Sie können die unterschiedlichen Beobachtungstypen im Satellitensignal für einen oder mehrere Satelliten bearbeiten. Sie können zum Beispiel die verschlüsselte L2-Beobachtung für einen oder mehrere Satelliten deaktivieren.


Timeline-Befehle - Überblick
     Timeline-Befehle − Überblick

Überblick

Verschiedene Timeline-Befehle werden unter Verwendung einer oder mehrerer von insgesamt vier Methoden ausgeführt:

  Doppelklicken Sie auf Timeline-Bereiche und -Elemente

  Klicken Sie mit der rechten Maustaste auf Timeline-Bereiche und -Elemente, um ein Menü anzuzeigen, und wählen Sie eine Befehlsoption

  Klicken Sie auf Schaltflächen der Symbolleiste

  Benutzen Sie Tastenkombinationen

Es kann sein, daß nicht alle Befehle alle vier Methoden unterstützen.

Folgende Befehle sind verfügbar:

  Kontinuierlich

  Kopieren

  Ausschneiden

  Löschen

  DOP-Plot

  Aktivieren/Deaktivieren

  Ephemeriden

  Ephemeriden-Info

  Ereignisse

  Alle expandieren

  Einfügen

  Eigenschaften

  Satelliten

  Alles markieren

  Alle reduzieren

  Sky-Plot

  SV-Plot

  Timeline

  Zeitoptionen

  Rückgängig

  Ansicht Filter

  Vergrößern

  Verkleinern

  Zoom-Ausdehnung

  Vorherige Ansicht

  Zeitraum zoomen

Zusätzliche Befehle sind im SV-Plot verfügbar.


Timeline Eigenschaftsdialogfelder - Überblick
    Timeline-Eigenschaftsdialogfelder − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Überblick

Der größte Teil der Bearbeitung von Vermessungsdaten in Timeline wird in Eigenschaftsdialogfeldern durchgeführt. Einige Timeline-Felder, z. B. die Felder Start- und Stoppzeit für Besetzungen und Segmente können sowohl mit dem Zeit-Lineal als auch im Eigenschaftsdialogfeld bearbeitet werden. Timeline-Befehle für die Deaktivierung und Löschung von Daten mit Hilfe der Maus bieten zudem alternative Wege der Datenbearbeitung.

Auf Eigenschaftsdialogfelder kann auf zwei Arten zugegriffen werden:

  Doppelklicken Sie auf das Element.

  Klicken Sie mit der rechten Maustaste auf das Element, und wählen Sie Eigenschaften.

Die Timeline-Eigenschaftsdialogfelder bleiben geöffnet, bis Sie auf OK oder Abbrechen klicken. Es werden keine Änderungen an den Daten gespeichert, bis Sie auf OK klicken. Es kann mehr als ein Eigenschaftsdialogfeld zur gleichen Zeit geöffnet sein, was Ihnen erlaubt, verschiedene Elementeigenschaften miteinander zu vergleichen. Sie können zum Beispiel die Eigenschaftsdialogfelder für zwei oder mehrere Besetzungen zur gleichen Zeit ansehen.

Die folgenden Eigenschaftsdialogfelder sind verfügbar:

  Empfänger-Information

  Vermessungsinformation

  Besetzung/Datensegmenteigenschaften

  GPS-Eigenschaften

  Ephemeriden-Information

HINWEIS: Es gibt kein Eigenschaftsdialogfeld für Satelliten-Symbole, aber Sie können den SV-Plot ansehen, um die für jeden Satelliten aufgezeichneten Verfolgungsrohinformationen zu plotten, zu drucken oder zu exportieren, wodurch Daten zur Vermessung hinzugefügt werden. Diese Plots sind für die Überprüfung von Verfolgungsrohinformationen von Nutzen, wenn in GPS-Beobachtungen Lücken in der Broadcast-Aktivität entdeckt werden.


Timeline-Anzeigen - Überblick
     Timeline-Anzeigen − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch

Überblick

Timeline enthält zusätzliche Anzeigen für die Ansicht detallierter Informationen über die bei einer Vermessung aufgezeichneten Satellitenverfolgungs- und Ephemerideninformationen. Diese Anzeigen können als Hilfsmittel eingesetzt werden, um die Daten, die für Besetzungen aufgezeichnet wurden, und die GPS-Beobachtungen, die für individuelle Satelliten aufgezeichnet wurden, genauer zu untersuchen.

Die folgenden zusätzlichen Anzeigen stehen zur Verfügung:

  Satellitenbeobachtungsanzeige

  Ephemeriden-Informationsanzeigen

Richtlinien für die Analyse der in diesen Anzeigen geplotteten Informationen finden Sie in den vorstehenden Themen. Verwenden Sie diese Richtlinien, um die Daten genauer zu analysieren.


     Basislinienlösungen

Weitere Informationen

 Siehe auch

Fünf mögliche Lösungen für Basislinien sind nachstehend beschrieben:

  Float-Lösung

  Fixed-Lösung

  Widelane Fixed-Lösung

  Narrowlane Fixed-Lösung

  Ionosphären-freie Lösung


     Float-Lösung

Weitere Informationen

 Siehe auch

Eine Float-Lösung wird berechnet, wenn das Basislinienverarbeitungsprogram keinen definitiven ganzzahligen Wert für die Mehrdeutigkeiten berechnen kann. Bei der Basislinienverarbeitung wird für die Mehrdeutigkeit oft ein Wert wie z. B. 1000,60 berechnet. Dieser Wert liegt nicht nahe bei einem ganzzahligen Wert, und es ist schwierig, zu bestimmen, ob der Wert 1000 oder 1001 sein soll. Aus diesem Grunde kann das Basislinienverarbeitungsprogramm den Wert nicht auf den nächsten ganzzahligen Wert setzen. Die Komponenten der Basislinie werden berechnet, indem die Mehrdeutigkeiten als echte Werte verwendet werden. Diese Basislinienlösung ist nicht so genau, wie eine Fixed-Lösung.

Float-Lösungen ergeben sich aus unmodellierten atmosphärischen Fehlern, Fehlern in der Erdumlaufbahn und anderen Fehlern.


     Fixed-Lösung

Weitere Informationen

 Siehe auch

Eine Fixed-Lösung wird berechnet, wenn das Verarbeitungsprogramm einen Satz ganzzahliger Werte für die Mehrdeutigkeiten finden kann, der deutlich besser ist als alle anderen möglichen Sätze. Das Basislinienverarbeitungsprogramm verwendet für den Mehrdeutigkeitswert eine Ganzzahl, um die endgültigen Komponenten der Basislinie zu berechnen. Bei Echtzeit-Vermessungen gibt weist die Betriebsart „Fein-Modus" auf eine ganzzahlige Lösung hin.

Bei Einfrequenz-Empfängern ist die optimale Lösung normalerweise eine Fixed-Lösung, die durch eine doppelte Differenzierung berechnet wird. Bei Zweifrequenz-Empfängern ist es möglich, die Trägerphasenbeobachtungswerte auf mehrere Arten zu kombinieren, wobei mehrere verschiedene Fixed-Lösungen erzeugt werden.


     Widelane Fixed-Lösung

Weitere Informationen

 Siehe auch

Widelane bezieht sich auf die Verwendung einer Kombination der L1- und L2-Trägerphasenbeobachtungswerte in den Differenzgleichungen. Die Widelane-Trägerphase ergibt sich aus der Differenz der Trägerphasenbeobachtungen (L1–L2). Die effektive Wellenlänge des Widelane-Beobachtungswerts beträgt 86,2 cm.

Es ist leichter, ganzzahlige Mehrdeutigkeiten mit dieser Kombination von Messungen zu finden. Aus diesem Grunde wird bei der Berechnung langer Basislinien häufig die Widelane-Lösung verwendet.


     Narrowlane Fixed-Lösung

Weitere Informationen

 Siehe auch

Narrowlane bezieht sich auf die Verwendung einer Kombination der L1- und L2-Trägerphasenbeobachtungswerte in den Differenzgleichungen. Die Narrowlane-Trägerphase ergibt sich aus der Addition der Trägerphasenbeobachtungen (L1+L2). Die effektive Wellenlänge des Narrowlane-Beobachtungswerts beträgt 10,7 cm. Die Narrowlane ist sehr nützlich bei der Aufhebung ionosphärischer Effekte in GPS-Vermessungsbeobachtungen.


Ionosphähren-freie Lösung
     Ionosphären-freie Lösung

Weitere Informationen

 Siehe auch

Die ionosphären-freie Lösung verwendet eine Kombination der L1- und L2-Trägerphasen, um die Auswirkungen der Ionosphäre auf die GPS-Signale zu modellieren und zu entfernen. Dieser Lösungstyp wird häufig für hochrangige Kontrollvermessungen verwendet, besonders bei der Vermessung langer Basislinien.


     Signalstärke

Die Signalstärke eines Satelliten, auch Signal-Rausch-Verhältnis (SNR) genannt, ist ein Maß für den Informationsgehalt eines Signals im Verhältnis zum Rauschen des Signals. Bei abnehmendem Verhältnis gehen Informationen im Rauschen unter. Die Signalqualität verbessert sich bei zunehmendem Signalpegel (ein Signalpegel von 14 ist besser als ein Signalpegel von 8). Der typische L1-Signalpegel eines Satelliten mit einer Höhenmaske von 30° liegt zwischen 12 und 20. Ein L1-Wert über 20 ist sehr gut. Die Datenqualität ist schlecht, wenn der L1-Signalpegel eines Satelliten in der Konstellation unter 6 liegt. Schlechte Signalpegel ergeben Positionen, die für die Navigation, nicht aber für Vermessungen ausreichend sind. Beachten Sie, daß die L2-SNR oft niedriger ist als die L1-SNR. Sie können sich auf die L1-Signalstärke konzentrieren, um das Rauschen in den Daten zu beurteilen.

GPS-Satellitensignale sind verhältnismäßig schwach. Tatsächlich ist das ständige Hintergrundrauschen stärker als das GPS-Signal. Wenn die Signalstärke eines Satelliten besonders schwach ist, können die mit diesen Messungen berechneten Positionen ungenau sein.

Es gibt zwei allgemeine Ursachen für schwache Signale. Erstens ist das Signal, das die Antenne nach dem Durchqueren eines Hindernisses (wie z. B. einer Baumkrone) erreicht, normalerweise abgeschwächt. Die abschwächende Wirkung von Baumkronen kann minimiert werden, indem der Empfänger so aufgestellt wird, daß er eine klare Sicht zum Himmel hat. Zweitens haben Satelliten, die sich in geringer Höhe über dem Horizont befinden, normalerweise ein schwächeres Signal als die, die sich direkt über Ihnen befinden.

Die Verwendung von tiefstehenden Satelliten kann auch zu Mehrwegeausbreitungen führen (Fehler, die von einem reflektierten GPS-Signal verursacht werden). Um die nachteiligen Auswirkungen tiefstehender Satelliten zu vermeiden, halten Sie sich an die für die Vermessung empfohlenen Höhenmasken. Die meisten nachverarbeiteten Vermessungen und Echtzeit-Vermessungen werden mit einer Höhenmaske von 13° durchgeführt. Satellitendaten werden selten aufgezeichnet, wenn sich die Satelliten unter 10° befinden.


     Dilution of Precision (DOP)

Die Dilution of Precision (DOP) ist ein Maß für die Qualität einer Position. Sie ist das Ergebnis einer Berechnung, die die Position jedes Satelliten relativ zu den anderen Satelliten in der Konstellation (die Satellitengeometrie) berücksichtigt, um die Genauigkeit der mit dieser Konstellation erzielten Positionen vorauszusagen. Ein niedriger DOP-Wert weist auf eine starke Satellitengeometrie und auf eine höhere Genauigkeitswahrscheinlichkeit hin. Ein hoher DOP-Wert weist auf eine schwache Satellitengeometrie und eine niedrigere Genauigkeitswahrscheinlichkeit hin.

Die im allgemeinen berechneten DOP-Typen sind nachfolgend aufgeführt:

  Relative (RDOP) − Relativer Positionsfehler

  Position (PDOP) − Horizontale und vertikale Messungen (Br, Lä, Hö)

  Horizontale (HDOP) − Horizontale Messungen (Br, Lä)

  Vertikale (VDOP) − Vertikale Messungen (Hö)

  Zeit (TDOP) − Uhrabweichung

PDOP ist das beste allgemeine Kennzeichen für die Genauigkeit der Konstellation, wobei der PDOP-Wert selbst jedoch noch keine gute Berechnung der Basislinien garantiert. Ein PDOP-Wert von 4 oder darunter ergibt hervorragende Positionen. Ein PDOP-Wert zwischen 5 und 7 ist akzeptabel; ein PDOP-Wert von 7 oder höher ist schwach. Sie können auch die PDOP-Maske in Ihrem Empfänger so einstellen, daß sie Konstellationen ignoriert, deren PDOP-Wert höher ist als der von Ihnen festgelegte Grenzwert. Die Voreinstellung für die PDOP-Maske in Trimble-Vermessungsempfängern ist 7. Beachten Sie, daß diese Maske nur die Positionsbestimmung beeinflußt und keinen großen Einfluß auf nachfolgende Basislinienverarbeitungen hat.

Mit dem Programm QuickPlan können Sie den PDOP-Wert bei der Feldbeobachtung berechnen. Durch Eingabe sowohl des gewünschten Orts als auch der Zeit, kann die Sichtbarkeit und die Geometrie der Satelliten vorhergesagt werden.


Basislinienverarbeitungsprotokoll - Überblick
     Basislinienverarbeitungsprotokoll − Überblick

Überblick

Das Basislinienverarbeitungsprogramm erstellt eine Protokolldatei. Diese Datei enthält Informationen, die bei der Analyse der Basislinienlösungen nützlich sein können.

Der Name der Protokolldatei ist ProcessingLog.html. Sie wird in jedem Projekt im Ordner Reports\Baseline gespeichert. Die Datei ProcessingLog.html kann mit einem HTML-Anzeigemodul oder mit einem Web-Browser angesehen werden.

Diese Datei wird für jede GPS-Verarbeitungssitzung erstellt. Wenn die Datei einer vorherigen Verarbeitungssitzung nicht umbenannt wird, wird sie bei jeder neuen Verarbeitungssitzung überschrieben. Das Basislinienverarbeitungsprogramm verwendet diese Datei zur Speicherung von Warn- und Fehlermeldungen, die die Verarbeitungsresultate betreffen.

Wenn Warn- oder Fehlermeldungen während der Verarbeitung in dieser Datei gespeichert werden, erscheint nach beendeter Verarbeitung ein Dialogfeld. Über dieses Dialogfeld ist der Zugriff auf den Inhalt der Datei möglich, abhängig von der Einstellung, die im Dialogfeld Projekteigenschaften / Berichte festgelegt wurde. Eine oder mehrere der folgenden Warn- oder Fehlermeldungen können in der Datei enthalten sein:

Fehler

  Basislinie nicht gelöst

Basislinie <NameVonPunkt> -> <NameZuPunkt> nicht gelöst

  Segment für Berechnung weist nicht genügend Daten für OTF-Verarbeitung auf

Segment (<GPSWoche> <GPSWocheSekunden>) für Berechnung weist nicht genügend Daten für OTF-Verarbeitung auf.  Segmentlänge = <ZeitDauer>

  Initialisierung des kinematischen Segments gescheitert

Initialisierung des kinematischen Segments gescheitert. Segment: <GPSWoche> <GPSWocheSekunden> -> <GPSWoche> <GPSWocheSekunden>

  Initialisierung über bekanntem Punkt gescheitert

Initialisierung über bekanntem Punkt gescheitert

  Initialisierung über statischer Basislinie gescheitert

Initialisierung über statischer Basislinie gescheitert

  Kinematische Lösung gescheitert

<Dateiname> für kinematische Lösung gescheitert. Start: <GPSWoche> <GPSWocheSekunden>    Stop: <GPSWoche> <GPSWocheSekunden>

  Stop&Go Lösung gescheitert

<Punktname> Stop&Go Lösung gescheitert.

Warnmeldungen

Die Datei kann folgende Warnmeldungen enthalten:

  Doppelte Lösungen für Basislinie

<Basislinien-ID> Doppelte Lösungen für Basislinie in dieser Sitzung. Nur eine Lösung wird gespeichert.

  Keine genauen Ephemeriden verfügbar

Keine genauen Ephemeriden für <NameVonPunkt> -> <NameZuPunkt> <GPSWoche> <GPSWocheSekunden> verfügbar, verwende Broadcast


     Basislinie nicht gelöst

Diese FEHERMELDUNG hat folgendes Format:

Basislinie <NameVonPunkt> -> <NameZuPunkt> nicht gelöst

<VonPunkt> und <ZuPunkt> sind Punktnamen im Projekt und dienen der Identifikation der Basislinie.

Wenn dieser Fehler auftritt, enthält die GPS-Verarbeitungsliste keine Lösung für diese Basislinie.


     Segment für Berechnung weist nicht genügend Daten für OTF-Verarbeitung auf

Diese FEHERMELDUNG hat folgendes Format:

Segment (<GPSWoche> <GPSWocheSekunden>) für Berechnung weist nicht genügend Daten für OTF-Verarbeitung auf. Segmentlänge = <ZeitDauer>

<GPSWoche> und <GPSWocheSekunden> bezeichnen die Startzeit des Segments, für die keine OTF-Verarbeitung durchgeführt werden konnte. Sie können diese Zeitangabe verwenden, um die entsprechende GPS-Messung in Timeline anzusehen.

<ZeitDauer> bezeichnet den Zeitraum der GPS-Messung, für die keine OTF-Verarbeitung durchgeführt werden konnte.

Wenn dieser Fehler auftritt, konnte das Basislinienverarbeitungsprogramm keine OTF-Initialisierung durchführen. Dies kann dazu führen, daß eine oder mehrere Basislinienlösungen zurückgewiesen werden und nicht in der GPS-Verarbeitungsliste enthalten sind.


     Initialisierung des kinematischen Segments gescheitert

Diese FEHERMELDUNG hat folgendes Format:

Initialisierung des kinematischen Segments gescheitert. Segment: <GPSWoche> <GPSWocheSekunden> -> <GPSWoche> <GPSWocheSekunden>

<GPSWoche> und <GPSWocheSekunden> bezeichnen die Anfangs- und Endzeit des Segments, für die keine kinematische Initialisierung durchgeführt werden konnte. Sie können diese Zeitangaben verwenden, um die entsprechenden GPS-Messungen in Timeline anzusehen.

Wenn dieser Fehler auftritt, konnte das Basislinienverarbeitungsprogramm keine Initialisierung durchführen. Dies kann dazu führen, daß eine oder mehrere kinematische Basislinienlösungen zurückgewiesen werden und nicht in der GPS-Verarbeitungsliste enthalten sind.


     Initialisierung über bekanntem Punkt gescheitert

Diese FEHERMELDUNG hat folgendes Format:

Initialisierung über bekanntem Punkt gescheitert

Wenn dieser Fehler auftritt, konnte das Basislinienverarbeitungsprogramm keine kinematische Initialisierung von einem bekannten Punkt aus durchführen. Dies kann dazu führen, daß eine oder mehrere kinematische Basislinienlösungen zurückgewiesen werden und nicht in der GPS-Verarbeitungsliste enthalten sind.


     Initialisierung über statischer Basislinie gescheitert

Diese FEHERMELDUNG hat folgendes Format:

Initialisierung über statischer Basislinie gescheitert

Wenn dieser Fehler auftritt, konnte das Basislinienverarbeitungsprogramm keine kinematische Initialisierung von einer statischen Besetzung aus durchführen. Dies kann dazu führen, daß eine oder mehrere kinematische Basislinienlösungen zurückgewiesen werden und nicht in der GPS-Verarbeitungsliste enthalten sind.


     Kinematische Lösung gescheitert

Diese FEHERMELDUNG hat folgendes Format:

<Dateiname> Kinematische Lösung gescheitert. Start: <GPSWoche> <GPSWocheSekunden>    Stop: <GPSWoche> <GPSWocheSekunden>

<Dateiname> ist der Name der GPS-Messungsdatei, die für die Berechnung der kinematischen Lösung verwendet wurde.

<GPSWoche> und <GPSWocheSekunden> bezeichnen die Anfangs- und Endzeit des Segments, für die keine kinematische Lösung berechnet werden konnte. Sie können diese Zeitangaben verwenden, um die entsprechenden GPS-Messungen in Timeline anzusehen.

Wenn dieser Fehler auftritt, enthält die GPS-Verarbeitungsliste keine Lösung für die Basislinie.


     Stop&Go Lösung gescheitert

Diese FEHERMELDUNG hat folgendes Format:

<Punktname> Stop&Go Lösung gescheitert.

<Punktname> ist der Name des Punktes, für den keine kinematische Stop&Go-Lösung berechnet werden konnte.

Wenn dieser Fehler auftritt, enthält die GPS-Verarbeitungsliste keine Lösung für die Basislinie.


     Doppelte Lösungen für Basislinie

Diese WARNMELDUNG hat folgendes Format:

<Basislinien-ID> Doppelte Lösungen für Basislinie in dieser Sitzung. Nur eine Lösung wird gespeichert.

<Basislinien-ID> ist die Beobachtungskennung, die der Basislinie im Projekt zugeordnet wurde.

Diese Warnmeldung erscheint, wenn in einer Stop und Go kinematischen Lösung Phasensprünge enthalten sind. Wenn jeder Besetzungsteil zwei oder mehrere Epochen umfaßt, berechnet das Basislinienverarbeitungsprogramm Lösungen vor und nach dem Auftreten des Phasensprungs und sieht die Besetzung als zwei unterschiedliche Besetzungen an.

Wenn das Kontrollkästchen ‘Doppelte Basislinienlösungen überschreiben‘ aktiviert ist, wird nur eine Lösung gespeichert. Gemäß Voreinstellung wird die letzte Lösung gespeichert. Sie können dies ändern, indem Sie das Kontrollkästchen für die Basislinienlösung aktivieren, die Sie beibehalten möchten, und das Kontrollkästchen für die Lösung, die nicht gespeichert werden soll, deaktivieren.

Doppelte Basislinienlösungen sind an der Basislinien-ID zu erkennen. Bei doppelten Basislinienlösungen, haben beide Lösungen dieselbe ID.


     Keine genauen Ephemeriden verfügbar

Diese WARNMELDUNG hat folgendes Format:

Keine genauen Ephemeriden für <NameVonPunkt> -> <NameZuPunkt> <GPSWoche> <GPSWocheSekunden> verfügbar, verwende Broadcast

<VonPunkt> und <ZuPunkt> sind die im Projekt enthaltenen Punktnamen der Basislinie.

<GPSWoche> und <GPSWocheSekunden> bezeichnen die Startzeit des Segments für die keine genauen Ephemeriden zur Verfügung stehen. Überprüfen Sie den Projektordner, der die entsprechenden Ephemeriden-Dateien enthält, um eine adäquate Abdeckung zu gewährleisten.

Wenn diese Warnmeldung angezeigt wird, wurde zwar die Verarbeitung der genauen Ephemeriden angefordert, aber es waren nicht genügend Daten verfügbar. Wenn dies geschieht, wird stattdessen die Broadcast-Ephemeride verwendet.