Copyright: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.
Citation: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.


Die Trimble DTMLink™ Software der Trimble Geomatics Office™ Software ist ein leistungsstarkes System für die Erzeugung von Höhenlinienmodellen. Mit dieser Software können Sie neue Höhenlinienmodelle erzeugen und Ihre zuvor erzeugten Höhenlinienmodelle bearbeiten. Sie können darüber hinaus Höhenlinienmodelle, die mit anderer Software erstellt wurden, importieren.

Die Software kann Begrenzungen und Bruchkanten in das Höhenlinienmodell einschließen, und bietet fortgeschrittene Bearbeitungsfunktionen für Dreiecke, um eine bessere Kontrolle über die Modellformung zu gewährleisten.

Ein Gitter- oder trianguliertes (TIN) Digitales Geländemodell wird von dem Höhenlinienmodell für den Export zu einer Kontrolleinheit oder in eine Datei erstellt.

Das von Ihnen erstellte Modell kann von der RoadLink™ Software für Erdbauberechnungen verwendet werden.

Mit der DTMLink Software können Sie Volumenberichte erstellen.

Typische Anwendungen für Volumenberechnungen sind:

  Abraumhalden und Vorratslager

  Schichtvolumen wie z. B. Kohleflöze

  Ungültige (leere) Volumen wie z. B. bei Seen hinter geplanten Staudämmen

Die DTMLink Software berechnet die Volumen individueller dreieckiger Prismen. Diese werden von den dreieckigen Ebenen definiert, die das Höhenlinienmodell bilden, indem die Basisflächen und Durchschnittshöhen von Prismen verwendet werden.

Mit der DTMLink Software können Sie Vergleichsoberflächen erstellen. Eine Vergleichsoberfläche ist ein Höhenlinienmodell der Differenz zwischen zwei Oberflächen. Sie können diese Oberfläche in Verbindung mit dem Volumenberechnungstyp ‘Oberhalb einer Höhe’ nutzen, um die Abtrags- und Auftragsvolumen zwischen den beiden Oberflächen zu berechnen.


Inhalt

Es stehen folgende Hilfe-Themen zur Verfügung:

1. Trimble DTMLink Software

2. Menübefehle

3. Tips

4. Fehlermeldungen

5. Alle Themen

Wir setzen voraus, daß Sie mit den Verwendungsgrundlagen von Microsoft Windows vertraut sind. Schlagen Sie bitte in Ihrer Microsoft Windows-Dokumentation nach, wenn Sie sich nicht sicher sind, wie Windows Software einzusetzen ist.


Alle Themen

Im Inhaltsabschnitt Alle Themen sind alle Hilfethemen alphabetisch aufgelistet.


Oberfläche öffnen
Datei / Oberfläche öffnen

	Klicken Sie auf das Symbol Oberfläche öffnen auf der Standard-Symbolleiste
Verwenden Sie diesen Befehl, um eine Oberfläche zu öffnen.

Oberflächen verfügbar in

Wählen Sie eine Bezeichnung aus der Liste mit Bezeichnungen, die im unteren Teil des Dialogfelds Oberfläche wählen angezeigt wird, und geben Sie diese Bezeichnung in das Feld unterhalb des Feldes Oberflächen verfügbar in ein. Wenn die Bezeichnung nicht aufgelistet ist, klicken Sie auf Ordner.

HINWEIS: Das Feld Oberflächen verfügbar in ist schreibgeschützt.

Ordner

Klicken Sie auf Ordner, um das Dialogfeld Ordner suchen zu öffnen. In dem Dialogfeld können Sie den Ordner wählen, in dem die Dateien enthalten sind. Der voreingestellte Ordner ist
C:\ Trimble Geomatics Office\Projekte\xx\RoadLink – DTMLink…, wobei xx die Projektbezeichnung ist.

TIP: Wenn Sie das Dialogfeld Ordner suchen verwenden, suchen Sie immer im untersten Verzeichnis nach der Oberflächen-Datei.


Oberfläche speichern
Datei / Oberfläche speichern

	Verwenden Sie das Symbol Oberfläche speichern auf der Standard-Symbolleiste

Verwenden Sie diesen Befehl, um an der aktuellen Oberfläche vorgenommene Änderungen zu speichern.


Oberfläche schließen
Datei / Oberfläche schließen

Verwenden Sie diesen Befehl, um eine Datei in der DTMLink™ Software zu schließen.


Importieren
Datei / Importieren

	Verwenden Sie das Symbol Importieren auf der Standard-Symbolleiste

Verwenden Sie diesen Befehl, um folgende Dateitypen in das Projekt zu importieren:

  Trimble TIN-DGM-Datei (*.ttm)

  Trimble Gitter-DGM-Datei (*.dtx)

  Oberfläche (TIN) aus TerraModel-Projektdatei (*.pro)

  Oberfläche (TIN) aus AutoCAD DXF-Datei

  Oberfläche aus LandXML-Datei (*.xml)

  Paydirt/SiteWork-Gitterdatei (*.grd)

  Civilcad ASCII 5-Datei

  12D-Oberflächendatei

  InRoads-Oberflächendatei

  MX GENIO-Datei

  REB-Oberflächendatei

  GEOPAK Grid Spots


Trimble TIN-DGM-Datei (*.ttm)

Verwenden Sie diesen Befehl, um eine Trimble TIN-Digitale Geländemodell-Datei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option Trimble TIN-DGM-Datei (*.ttm), und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in den Ordner, der die zu importierende Datei enthält. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

Das Feld Dateityp enthält nur die Option Trimble TIN-DGM-Dateien (*.ttm). Sie können den Dateityp in diesem Feld nicht ändern.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Trimble Gitter-DGM-Datei (*.dtx)

Verwenden Sie diesen Befehl, um eine Trimble Gitter-Digitale Geländemodell-Datei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option Trimble Gitter-DGM-Datei (*.dtx).

 	TIP: Klicken Sie auf die Schaltfläche Konfiguration, um Punkte, die das Gitter definieren und innerhalb einer festgelegten Toleranz liegen, zu entfernen.

3.	Klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie im Feld Suchen in den Ordner, der die zu importierende Datei enthält. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

Das Feld Dateityp enthält nur die Option Trimble Gitter-DGM-Dateien (*.dtx). Sie können den Dateityp in diesem Feld nicht ändern.

5.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

6.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Gitter-DGM-Konfiguration importieren

Verwenden Sie diese Option, um Punkte, die das Gitter definieren und innerhalb einer bestimmten Toleranz liegen, zu entfernen. Wählen Sie Gitter reduzieren, und legen Sie den Toleranzwert im Feld Gitter-TIN Reduktionstoleranz fest.


Oberfläche (TIN) aus TerraModel-Projektdatei (*.pro)

Verwenden Sie diesen Befehl, um eine Oberfläche (TIN) aus einer TerraModel-Projektdatei in DTMLink zu importieren.

HINWEIS: Damit TIN-Oberflächendateien richtig konvertiert werden können, muß die TerraModel-Projektdatei einen Layer mit einem Dreiecksnetz enthalten.

So importieren Sie die Datei:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option Oberfläche (TIN) aus TerraModel-Projektdatei (*.pro), und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in den Ordner, der die zu importierende Datei enthält. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen.

Wenn die Datei nur einen Layer enthält, wird die Oberfläche importiert. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.

Enthält die TerraModel-Projektdatei mehr als einen Layer, erscheint das Dialogfeld Zu importierende Oberflächen wählen.

6.	Wählen Sie den/die zu importierende(n) Layer. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Dialogfeld Zu importierende Oberflächen wählen

Verwenden Sie dieses Dialogfeld zur Auswahl des Layers, der für den Import konvertiert werden soll.

Wählen Sie aus der Liste Oberflächen den/die Layer, der/die in eine Oberflächendatei konvertiert werden soll(en). Sie können mehrere Layer zum Importieren auswählen, es kann jedoch nur jeweils eine Oberfläche angezeigt werden.


Oberfläche (TIN) aus AutoCAD DXF-Datei

Verwenden Sie diesen Befehl, um eine TIN-Oberfläche aus einer AutoCAD DXF-Datei in DTMLink zu importieren.

HINWEIS: Damit eine TIN-Oberfläche korrekt konvertiert werden kann, muß die AutoCAD DXF-Datei aus einem Dreiecksnetz mit 3D-Flächen oder 3D-Polylinien bestehen.

So importieren Sie die Datei:

1.	Wählen Sie Datei / Importieren

Das Dialogfeld Importieren erscheint.

2.	Wenn die DXF-Datei ursprünglich mit Einheiten erzeugt wurde, die nicht den Projekteinheiten entsprechen, klicken Sie auf Konfiguration, um die DXF-Datei zu konfigurieren.

Das Dialogfeld Konfiguration DXF/DWG-Import erscheint. Verwenden Sie dieses Dialogfeld, um der zu importierenden/zu konvertierenden DXF-Datei Einheiten zuzuweisen. Sie müssen dieselben Einheiten zuweisen, mit denen die ursprüngliche DXF-Datei erstellt wurde.

3.	Wählen Sie die entsprechenden Einheiten für die DXF-Datei.

4.	Klicken Sie im Dialogfeld Konfiguration DXF/DWG-Import auf OK.

5.	Klicken Sie im Dialogfeld Importieren auf OK.

Das Dialogfeld Öffnen erscheint.

6.	Wählen Sie im Feld Suchen in den Ordner, der die zu importierende Datei enthält. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

Das Feld Dateityp enthält nur die Option ASCII AutoCAD DXF-Datei (*.dxf). Sie können den Dateityp in diesem Feld nicht ändern.

7.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

8.	Klicken Sie auf Öffnen.

Wenn die Datei nur einen Layer enthält, wird die Oberfläche importiert. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.

Enthält die DXF-Datei mehr als einen Layer, erscheint das Dialogfeld Zu importierende Oberflächen wählen.

9.	Wählen Sie den/die zu importierende(n) Layer. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Dialogfeld Konfiguration DXF/DWG-Import

Verwenden Sie dieses Dialogfeld, um die Einheiten für den Import einer TIN-Oberfläche aus einer AutoCAD DXF-Datei einzustellen.

Einheiten

Verwenden Sie dieses Feld, um der zu importierenden DXF-Datei Einheiten zuzuweisen. Wenn im DTMLink-Projekt z. B. Koordinaten in Internationalen Fuß verwendet werden, die *.dxf-Datei aber in Metern erstellt wurde, müssen Sie beim Importieren der Datei in dieser Gruppe Meter einstellen.

Wählen Sie die Dateien aus der Dropdown-Liste:

  Meter (m)

  Internationale Fuß (ft)

  US-Vermess.-Fuß (FT)

HINWEIS: Beim Importieren einer TIN-Oberfläche aus einer AutoCAD DXF-Datei ist das Feld Polylinien komprimieren nicht verfügbar.


Oberfläche aus LandXML-Datei (*.xml)

Verwenden Sie diesen Befehl, um eine Oberfläche aus einer LandXML-Datei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option Oberfläche aus LandXML-Datei (*.xml), und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Paydirt/SiteWork-Gitterdatei (*.grd)

Verwenden Sie diesen Befehl, um eine SiteWork-Gitterdatei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option Paydirt/SiteWork-Gitterdatei (*.grd).

TIP: Klicken Sie auf die Schaltfläche Konfiguration, um Punkte, die das Gitter definieren und innerhalb einer festgelegten Toleranz liegen, zu entfernen.

3.	Klicken Sie im Dialogfeld Importieren auf OK.

Das Dialogfeld SiteWork-Gitterdatei importieren erscheint.

4.	Klicken Sie auf Durchsuchen, um den Ordner mit der gewünschten Datei zu lokalisieren.

5.	Navigieren Sie zur SiteWork-Gitterdatei.

6.	Klicken Sie auf OK, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Dialogfeld SiteWork-Gitterdatei importieren

Verwenden Sie dieses Dialogfeld, um eine SiteWork-Gitterdatei in DTMLink zu importieren.

Lage

In diesem Feld wird der Pfad der SiteWork-Gitterdatei angezeigt.

Durchsuchen

Klicken Sie auf diese Schaltfläche, um nach dem Ordner mit der SiteWork-Gitterdatei zu suchen.

Dateien

Verwenden Sie dieses Feld zur Auswahl der SiteWork-Gitterdatei.

OK

Klicken Sie auf diese Schaltfläche, um die SiteWork-Gitterdatei zu importieren.

Abbrechen

Klicken Sie auf diese Schaltfläche, um den Importvorgang abzubrechen und zum Dialogfeld Importieren zurückzukehren.


Civilcad ASCII 5-Datei

Verwenden Sie diesen Befehl, um eine Civilcad ASCII 5-Datei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option Civilcad ASCII 5-Datei (*.AS5).

TIP: Klicken Sie auf die Schaltfläche Konfiguration, um Punkte, die das Gitter definieren und innerhalb einer festgelegten Toleranz liegen, zu entfernen.

3.	Klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

5.	Klicken Sie auf Öffnen.

Das Dialogfeld Zu importierende Oberflächen wählen erscheint.

6.	Wählen Sie den Layer mit den Gitterinformationen.

7.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


12D-Oberflächendatei

Verwenden Sie diesen Befehl, um eine 12D-Oberfläche in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option 12D-Oberflächendatei, und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


InRoads-Oberflächendatei (*.tin)

Verwenden Sie diesen Befehl, um eine Oberfläche aus einer InRoads-Datei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option InRoads-Oberflächendatei, und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


MX GENIO TIN-Datei

Verwenden Sie diesen Befehl, um eine MX GENIO TIN-Datei (*.txt) in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option MX GENIO TIN-Datei, und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


GEOPAK Grid Spots

Verwenden Sie diesen Befehl, um ein Gitter-Digitales Geländemodell (*.dtx) aus einer GEOPAK-Datei in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option GEOPAK Grid Spots.

TIP: Klicken Sie auf die Schaltfläche Konfiguration, um Punkte, die das Gitter definieren und innerhalb einer festgelegten Toleranz liegen, zu entfernen.

3.	Klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

Das Feld Dateityp enthält nur die Option Alle Dateien (*.*). Sie können den Dateityp in diesem Feld nicht ändern, da eine GEOPAK-Datei eine beliebige Dateierweiterung haben kann.

5.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

6.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


REB-Oberflächendatei

Verwenden Sie diesen Befehl, um eine REB-Oberflächendatei (*.reb) in DTMLink zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie aus der Liste im Register Oberfläche die Option REB-Oberflächendatei, und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie im Feld Suchen in die zu importierende Datei. Der voreingestellte Ordner in DTMLink ist immer der Ordner, aus dem zuletzt eine Datei importiert wurde.

4.	Führen Sie einen der folgenden Vorgänge aus:

  Geben Sie den Dateinamen ein.

  Klicken Sie auf die gewünschte Datei.

5.	Klicken Sie auf Öffnen, um die Oberfläche zu importieren. Wenn eine Oberfläche gleichen Namens bereits im Projekt existiert, erscheint das Dialogfeld Oberfläche importieren. Sie müssen dann die zu importierende Oberfläche umbenennen.


Oberfläche importieren

Verwenden Sie das Dialogfeld Oberfläche importieren, um die neue Oberfläche zu benennen. Das Dialogfeld erscheint nur, wenn eine Oberfläche gleichen Namens bereits im Projekt existiert.

Neuer Oberflächenname

Der Dateiname ist der Standardname der Oberfläche. Verwenden Sie dieses Feld, um der Oberfläche einen eindeutigen Namen zuzuweisen.


Exportieren

Datei / Exportieren

	Verwenden Sie das Symbol Exportieren auf der Standard-Symbolleiste

Verwenden Sie diesen Befehl, um eine Datei zu einer Kontrolleinheit oder zu einem TDS-Gerät zu exportieren oder um eine Datei zu erstellen.

HINWEIS: Exportformate, die ASCII-Dateien ausgeben, geben numerische Daten immer in standardisierter Form aus, d. h., keine Trennzeichen pro Tausend und keine Punkte für Dezimalstellen.

Das Dialogfeld Exportieren enthält verfügbare Exportformate. Die Register in dem Dialogfeld zeigen die Exportformattypen an.

Register System

Verwenden Sie dieses Register, um das Exportformat aus der Liste verfügbarer Exportformate zu wählen.

Verwenden Sie dieses Exportformat…	um folgendes zu erstellen…
TIN-DGM zu Trimble Survey Controller	eine kompatible Dreiecksnetz-DGM-Datei der gewählten Punkte zum direkten Export in die Trimble Survey Controller Software.
TIN-DGM zu Trimble Survey Controller-Datei (*.ttm)	eine Dreiecksnetz-DGM-Datei der gewählten Punkte.
Gitter-DGM zu Trimble Survey Controller	eine kompatible Gitter-DGM-Datei der gewählten Punkte zum direkten Export in die Trimble Survey Controller Software.
Gitter-DGM zu Trimble Survey Controller-Datei (*.dtx)	eine Gitter-DGM-Datei der gewählten Punkte. Die in eine ASCII-Datei ausgegebenen Gitter-DGM-Werte befinden sich immer im Meter-Format.
TIN-DGM zu Trimble 5600 TDS	eine kompatible Dreiecksnetz-DGM-Datei der gewählten Punkte zum direkten Export auf ein Trimble 5600 TDS-Instrument.
TIN-DGM zu Trimble 5600 TDS-Datei (*.dtm)	eine Dreiecksnetz-DGM-Datei der gewählten Punkte als Trimble 5600 TDS-Datei (*.dtm), die von einem Trimble 5600 TDS mit TDS Survey Pro CE eingelesen werden kann.
TIN-DGM zu TDS Survey Pro CE	eine kompatible Dreiecksnetz-DGM-Datei der gewählten Punkte, die von einer TDS Survey Pro CE-Kontrolleinheit gelesen werden kann.
TIN-DGM zu TDS Survey Pro CE-Datei (*.dtm)	eine Dreiecksnetz-DGM-Datei der gewählten Punkte, die von einer TDS Survey Pro CE-Kontrolleinheit gelesen werden kann.
3D-Flächen-AutoCAD-DXF-Datei	eine ASCII-DXF-Datei aus 3D-Flächen. Diese Datei kann von einer Software anderer Hersteller eingelesen werden. Für jedes Dreieck im Höhenlinienmodell wird ein 3D-Flächen-Element geschrieben.
Höhenlinien zu AutoCAD DXF-Datei	eine ASCII-DXF-Datei der Höhenlinien, die in eine Software anderer Hersteller eingelesen werden kann. Klicken Sie auf Konfigurieren, um die Ausgabeoptionen festzulegen.

 Siehe auch


Gitter-DGM für Trimble Survey Controller

Verwenden Sie diesen Typ, um einen regulären Satz von Gitter-Daten mit den Höhen der vom Höhenlinienmodell interpolierten Punkte zu erstellen.

HINWEIS: Das Gitter-Digitale Geländemodell (DGM) ermöglicht es Ihnen, ein reguläres Nord-Süd/Ost-West-Gitter von Punkten aus dem aktuellen Höhenlinienmodell zu interpolieren.

Verwenden Sie den Befehl Datei / Exportieren, um ein Gitter-DGM für den Export zur Trimble Survey Controller™ Software, Version 6.5 oder höher, zu erstellen.

Wählen Sie entweder das Exportformat Gitter-DGM zu Trimble Survey Controller oder Gitter-DGM zu Trimble Survey Controller-Datei.

Klicken Sie auf OK. Ein rechteckiges Gitter erscheint im Graphikfenster. Dieses rechteckige Gitter zeigt das kleinste Rechteck an, das die Oberfläche vollständig abgrenzt. Sie können die von Ihnen gewünschte Fläche durch Ziehen der rechteckigen Gitterbegrenzungen definieren.

TIP: Verwenden Sie die Felder Links, Oben, Rechts und Unten im Gruppenkästchen des Dialogfelds Gitter-Rechteck, um die Feinabstimmung bezüglich der Größe des Rechtsecks durchzuführen.

Die Felder im Dialogfeld Gitter-Rechteck sind:

Links

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Rechtswert auf der linken Kästchenseite ein, in Metern, Internationalen Fuß oder US-Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem linken Rechtecksrand im Graphikfenster an.

Oben

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Hochwert auf der oberen Kästchenseite ein, in Metern, Internationalen Fuß oder US-Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem oberen Rechtecksrand im Graphikfenster an.

Rechts

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Rechtswert auf der rechten Kästchenseite ein, in Metern, Internationalen Fuß oder US-Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem rechten Rechtecksrand im Graphikfenster an.

Unten

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Hochwert auf der unteren Kästchenseite ein, in Metern, Internationalen Fuß oder US-Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem unteren Rechtecksrand im Graphikfenster an.

Gittergröße

Verwenden Sie die Felder im Register Gittergr., um die Anzahl der Spalten und Reihen (Zeilen) anzugeben, aus denen das Gitter bestehen soll.

Spalten	Geben Sie die Spaltenanzahl für das Gitter-Rechteck ein.
Reihen	Geben Sie die Reihenanzahl für das Gitter-Rechteck ein.
Diese Felder weisen beide die Voreinstellung zehn (10) auf. Das bedeutet, daß es möglich ist, das Gitter auf rechteckiger Basis zu erzeugen.

HINWEIS: Wenn Sie die Anzahl der Spalten und/oder Reihen im Register Gittergr. ändern, werden die Felder Höhe und Breite im Register Schrittgr. von der DTMLink™ Software automatisch neu berechnet. Die aktualisierten Felder zeigen die neue Breite und Höhe für jede Schrittgröße an.

Schrittgröße

Verwenden Sie die Felder im Register Schrittgr., um die Breite und Höhe jeder Spalte und Reihe anzugeben, aus denen das Gitter bestehen soll.

Breite	Geben Sie den Wert für die Spaltenbreite ein.
Höhe	Geben Sie den Wert für die Reihenhöhe ein.
HINWEIS: Alle Änderungen an den Werten für Breite und/oder Höhe im Register Schrittgr. führen zu einer Neuberechnung der Gittergröße-Felder.

OK

Klicken Sie auf OK, um das Gitter-DGM zu exportieren. Die Datei enthält eine Liste der Koordinaten und interpolierten Höhen an jedem Gitterpunkt. Wenn Sie die Exportoption Gitter-DGM-zu-Trimble Survey Controller gewählt haben, können Sie das Gerät wählen, in dem die Datei gespeichert werden soll.

HINWEIS: Gitterpunkte innerhalb des Begrenzungsrechtecks, aber außerhalb des Höhenlinienmodells, haben keine interpolierte Höhe und werden als leere Linie in der Datei angegeben.


Trianguliertes DGM für Trimble Survey Controller

Verwenden Sie diesen Typ, um Dreiecksnetzdaten auf der Grundlage der Punkte zu erstellen, die die Dreiecke des Höhenlinienmodells definieren.

So erstellen Sie ein trianguliertes DGM zum Export in die Trimble Survey Controller Software Version 7.5 oder höher:

1.	Wählen Sie Datei / Exportieren.

2.	Wählen Sie im Dialogfeld Exportieren eine der folgenden Optionen:

  TIN-DGM zu Trimble Survey Controller

  TIN-DGM zu Trimble Survey Controller-Datei

3.	Klicken Sie auf OK.

Im Graphikfenster zeigt ein rechteckiges Gitter das kleinste Rechteck an, daß die Oberfläche vollständig umschließt. Sie können die gewünschte Fläche durch Ziehen der rechteckigen Gitterbegrenzungen definieren.

TIP: Verwenden Sie die Felder Links, Oben, Rechts und Unten im Gruppenkästchen des Dialogfelds TIN-Ausdehnung, um die Feinabstimmung bezüglich der Größe des Rechtecks durchzuführen.

Links

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Rechtswert auf der linken Kästchenseite ein, in Metern, Internationalen Fuß oder US-Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem linken Rechtecksrand im Graphikfenster an.

Oben

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Rechtswert auf der oberen Kästchenseite ein, in Metern, Internationalen Fuß oder US Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem oberen Rechtecksrand im Graphikfenster an.

Rechts

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Rechtswert auf der rechten Kästchenseite ein, in Metern, Internationalen Fuß oder US Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem rechten Rechtecksrand im Graphikfenster an.

Unten

Verwenden Sie die graphische Auswahl, oder geben Sie Werte für den Rechtswert auf der unteren Kästchenseite ein, in Metern, Internationalen Fuß oder US Vermess.-Fuß gemessen. Dieses Feld zeigt die Ausdehnung des Ziehens an dem unteren Rechtecksrand im Graphikfenster an.

OK

Klicken Sie auf OK, um das Dreiecksnetz-DGM zu exportieren. Die Datei enthält eine Liste der Koordinaten und Höhen für jedes Dreieck. Wenn Sie die Exportoption TIN-DGM zu Trimble Survey Controller gewählt haben, können Sie das Gerät wählen, in dem die Datei gespeichert werden soll.


Trianguliertes DGM für Trimble 5600 TDS

Verwenden Sie diesen Typ, um Dreiecksnetz-Daten auf der Grundlage der Punkte, die die Dreiecke des Höhenlinienmodells definieren, zu erstellen.

So erstellen Sie ein trianguliertes DGM für den Export zu einem Trimble 5600 TDS:

1.	Wählen Sie Datei / Exportieren.

2.	Wählen Sie im Dialogfeld Exportieren eine der folgenden Optionen:

  TIN-DGM zu Trimble 5600 TDS

  TIN-DGM zu Trimble 5600 TDS-Datei

3.	Klicken Sie auf die Schaltfläche Konfigurieren, um die Einheiten der zu exportierenden Datei festzulegen. Verwenden Sie diese Option, um das TIN-DGM in Einheiten zu exportieren, die sich von denen des DTMLink-Projekts unterscheiden.

4.	Klicken Sie auf OK, um das Dreiecksnetz-DGM zu exportieren.


Trianguliertes DGM für TDS Survey Pro CE

Verwenden Sie diesen Typ, um Dreiecksnetz-Daten auf der Grundlage der Punkte, die die Dreiecke des Höhenlinienmodells definieren, zu erstellen.

So erstellen Sie ein trianguliertes DGM für den Export zu einem TDS Survey Pro CE:

1.	Wählen Sie Datei / Exportieren.

2.	Wählen Sie im Dialogfeld Exportieren eine der folgenden Optionen:

  TIN-DGM zu TDS Survey Pro CE

  TIN-DGM zu TDS Survey Pro CE-Datei

3.	Klicken Sie auf die Schaltfläche Konfigurieren, um die Einheiten der zu exportierenden Datei festzulegen. Verwenden Sie diese Option, um das TIN-DGM in Einheiten zu exportieren, die sich von denen des DTMLink-Projekts unterscheiden.

4.	Klicken Sie auf OK, um das Dreiecksnetz-DGM zu exportieren.


TDS TIN-DGM Optionen exportieren

Verwenden Sie diese Option, um das TIN-DGM in Einheiten zu exportieren, die sich von denen des DTMLink-Projekts unterscheiden. Wählen Sie die entsprechenden Streckeneinheiten aus der Liste.


Oberfläche umbenennen
Datei / Oberfläche umbenennen

Verwenden Sie diesen Befehl, um die aktuelle Oberflächen-Datei umzubenennen.

Das Dialogfeld Oberfläche umbenennen erscheint. Geben Sie den neuen Namen für die aktuelle Oberfläche in das Feld ein.

Klicken Sie auf OK, um die aktuelle Oberfläche umzubenennen.


Oberfläche kopieren
Datei / Oberfläche kopieren

Verwenden Sie diesen Befehl, um die aktuelle Oberflächen-Datei zu kopieren.

Das Dialogfeld Oberfläche kopieren erscheint. Geben Sie einen eindeutigen Namen für die neue Oberfläche ein.

OK

Klicken Sie auf OK, um die Oberfläche zu kopieren.


Oberfläche löschen
Datei / Oberfläche löschen

Verwenden Sie diesen Befehl, um eine Oberfläche zu löschen.

Ordner

Klicken Sie auf Ordner, um das Dialogfeld Ordner suchen zu öffnen. In diesem Dialogfeld können Sie zu der gewünschten Oberflächen-Datei navigieren.

Oberflächen werden in C:\Trimble Geomatics Office\Projekte\xx\RoadLink – DTMLink… gespeichert, wobei xx die Projektbezeichnung ist.

TIP: Verwenden Sie den Microsoft Windows-Papierkorb, um Dateien wiederherzustellen.


Beenden
Datei / Beenden

Verwenden Sie diesen Befehl, um die aktuelle Oberfläche zu schließen und die DTMLink™ Software zu beenden.


Menü "Datei"

Verwenden Sie das Menü “Datei”, um die Oberflächen zu verwalten. Es verfügt über die folgenden Befehle:

Oberfläche öffnen

Oberfläche speichern

Oberfläche schließen

Importieren

Exportieren

Oberfläche umbenennen

Oberfläche kopieren

Oberfläche löschen

Beenden


3D-Flächen-AutoCAD-DXF-Datei

DTMLink erzeugt eine ASCII-DXF-Datei aus 3D-Flächen. Die Koordinaten und Höhen an jedem Scheitelpunkt eines Dreiecks werden im DXF-Format in die Datei geschrieben.

So exportieren Sie eine 3D-Flächen-DXF-Datei:

1.	Verwenden Sie den Befehl Datei / Exportieren.

2.	Wählen Sie die Exportoption 3D-Flächen-AutoCAD-DXF-Datei.

3.	Klicken Sie auf OK.

Das Dialogfeld 3D-Flächen nach DXF-Datei exp. erscheint.

4.	Geben Sie einen Namen in das Feld Dateiname ein.

5.	Klicken Sie auf Speichern.

Die Datei wird gemäß Voreinstellung im Ordner C:\Trimble Geomatics Office\Projekte\xx\RoadLink – DTMLink … gespeichert, wobei xx der Projektname ist.


Höhenlinien zu AutoCAD DXF-Datei

Verwenden Sie diese Option, um eine ASCII DXF-Datei der Höhenlinien zu erstellen.

So exportieren Sie eine DXF-Höhenlinien-Datei:

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Exportformat für die Erstellung der ASCII DXF-Höhenlinien-Datei. Diese Datei und die Höhenlinien können von der Trimble Geomatics Office™ Software und anwendbarer Software anderer Hersteller gelesen und angezeigt werden.

3.	Klicken Sie auf Konfigurieren, um die Ausgabeoptionen festzulegen.

Das Dialogfeld DXF-Höhenlinien-Optionen erscheint.

4.	Wählen Sie eine der folgenden Optionen:

  Die Option Gerade Linien, um die Höhenlinien als gerade Linien zu exportieren.

  Die Option Liniensegmente nähern sich Kurve an, um die Höhenlinien als Liniensegmente von annähernden Kurven zu exportieren.

5.	Geben Sie die maximale Länge der Liniensegmente ein.

5.	Klicken Sie auf OK, um die Ausgabeoption zu bestätigen.

Das Dialogfeld Exportieren erscheint.

7.	Klicken Sie auf OK.

Das Dialogfeld Höhenlinien in DXF-Datei exportieren erscheint.

8.	Geben Sie einen Dateinamen ein.

9.	Klicken Sie auf Speichern, um die Datei zu exportieren.

Die Datei wird gemäß Voreinstellung im Ordner C:\Trimble Geomatics Office\Projekte\xx\RoadLink – DTMLink … gespeichert, wobei xx der Projektn   ame ist.


DXF-Höhenlinien-Optionen

Verwenden Sie dieses Dialogfeld, um die Ausgabeoptionen für die DXF-Höhenlinien festzulegen.

Sie können die Höhenlinien als gerade Linien oder Liniensegmente von annähernden Kurven exportieren.

Wenn Sie die Höhenlinien als Liniensegmente von annähernden Kurven exportieren, können Sie die Länge der Liniensegmente festlegen. Je kürzer das Liniensegment, um so besser ist die Kurvenannäherung, die DXF-Datei enthält dann jedoch eine größere Anzahl von Punkten.


Dialogfeld Öffnen

Führen Sie die folgenden Vorgänge im Standard-Dialogfeld Öffnen aus:

1.	Suchen Sie nach dem gewünschten Ordner.

2.	Wählen Sie den Dateityp.

3.	Wählen Sie die Datei.


Rückgängig
Bearbeiten / Rückgängig

	Klicken Sie auf das Symbol Rückgängig auf der Standard-Symbolleiste

Verwenden Sie diesen Befehl/dieses Symbol, um die letzte an der Oberfläche vorgenommene Änderung rückgängig zu machen. Der Text des Menübefehls zeigt an, um welche Änderung es sich handelt.


Menü "Bearbeiten"

Verwenden Sie das Menü “Bearbeiten”, um die letzte an der Oberfläche vorgenommene Änderung rückgängig zu machen.

Es verfügt über den folgenden Befehl:

Rückgängig


Hilfethemen
Hilfe / Hilfethemen

Innerhalb der DTMLink™ Software sind Befehle in Menüs unterteilt.

Die Menübefehle sind:

Datei

Bearbeiten

Ansicht

Entwurf

Hilfsmittel

Fenster

Hilfe


Info
Hilfe / Info

Der Befehl Info in dem Menü “Hilfe” zeigt Programm- und Copyright-Informationen bezüglich der DTMLink™ Software an.

HINWEIS: Es ist nicht zulässig, dieses Programm zu kopieren, es sei denn, dies geschieht für Archiv- oder Sicherungszwecke.

Sie benötigen diese Information, wenn Fehler auftreten sollten, die technischer Unterstützung bedürfen.


Tip des Tages
Hilfe / Tip des Tages

Das Tip des Tages-System bietet kurze, hilfreiche Tips, die Ihnen bei der Bedienung Ihres Systems assistieren. Die Wahl dieser Option zeigt den nächsten Tip des Tages an. Ein Kontrollkästchen in dem Dialogfeld Tip des Tages läßt Sie wählen, ob ein Tip jedesmal erscheint, wenn Sie das System starten.


Menü "Hilfe"
Menü “Hilfe”

Das Menü “Hilfe” bietet Information über die DTMLink™ Software. Es verfügt über die folgenden Befehle:

Hilfethemen

Tip des Tages

Info


Die Symbolleisten verwenden

Symbolleisten bieten schnellen und in einem Schritt durchführbaren Zugriff auf häufig verwendete Menübefehle. Eine kurze Beschreibung jeder Schaltfläche der Symbolleiste erscheint auf der Statusleiste, wenn Sie die Maus über der Schaltfläche positionieren.

Die Meldung “Schließt einen Punkt in dem Oberflächenmodell ein” erscheint zum Beispiel im Meldungsfenster der Statusleiste, wenn Sie sich mit dem Cursor über die Schaltfläche Punkt einschließen auf der Oberflächen-Symbolleiste bewegen.

Sie können alle Symbolleisten verbergen, verschieben oder deren Größe verändern, und Sie können sie Ihren Arbeitsanforderungen gerecht anordnen.

Symbolleisten passen sich entweder an eine der Hauptfensterseiten, oberhalb des Arbeitsbereichs und unterhalb der Menüs, oder unterhalb des Arbeitsbereichs und unterhalb der Statusleiste an. Als Alternative können Sie jede Symbolleiste zu einer beliebigen Stelle auf dem Bildschirm verschieben und sie vertikal oder horizontal ausrichten.

Um die Voreinstellungen wiederherzustellen, betätigen Sie Zurücksetzen in Ansicht / Symbolleisten. (Jede Symbolleiste wird auf die Voreinstellungen zurückgesetzt, wenn Sie auf die Titelleiste der Symbolleiste doppelklicken).

QuickInfos

Wenn Sie den Cursor über einer Symbolschaltfläche positionieren, wird ein kleines Fenster namens QuickInfo eingeblendet, das angibt, welche Funktion dieses Symbol hat. Eine Kurzbeschreibung erscheint neben dem Cursor und unterhalb des Symbols.

HINWEIS: Das Docken der Symbolleisten verbirgt die Titelleiste.

Folgende Symbolleisten sind verfügbar:

Standard-Symbolleiste

Ansicht-Symbolleiste

Oberflächen-Symbolleiste


Standard-Symbolleiste

Die Standard-Symbolleiste bietet schnellen Zugriff auf einige Elemente im Hauptmenü.

Die folgenden Optionen sind auf der Standard-Symbolleiste verfügbar:

Schaltfläche	Menübefehl	Beschreibung
	Datei / Oberfläche öffnen	Öffnet eine bestehende Oberfläche
	Datei / Oberfläche speichern	Speichert Änderungen an der aktuellen Oberfläche
	Datei / Importieren	Importiert eine Oberfläche aus einem Softwarepaket anderer Herkunft
	Datei / Exportieren	Exportiert Daten zu einer Kontrolleinheit, einem TDS-Gerät oder in eine Datei
	Bearbeiten / Rückgängig	Macht den letzten Vorgang rückgängig. Das Menüelement gibt den Vorgang an, der rückgängig gemacht werden kann
	Ansicht/ Eigenschaften	Zeigt das Eigenschaftsfenster an. Dieses Fenster zeigt Informationen über Oberflächenpunkte, Bruchkanten und Begrenzungen an.


Ansicht-Symbolleiste

Die Ansicht-Symbolleiste bietet Navigationssymbole, um Ihnen bei der Ansicht im Graphik-Hauptfenster zu assistieren.

Die folgenden Optionen sind in der Ansicht-Symbolleiste verfügbar:

Schaltfläche	Menübefehl	Beschreibung
	Verknüpfungsmenü	Das Symbol Wählen läßt Sie einen Oberflächenpunkt, eine Bruchkante oder Begrenzungslinie wählen und ermöglicht es Ihnen, das gewählte Element im Eigenschaftsfenster anzusehen.
	Ansicht / Verschieben	Verschiebt die Mitte des Zoom-Bereichs
	Ansicht / Vergrößern	Vergrößert die Anzeige durch Maßstabserhöhung.
	Ansicht / Verkleinern	Verkleinert die Anzeige durch Maßstabsreduzierung.
	Ansicht / Zoom-Ausdehnung	Ändert den Maßstab, so daß im Fenster alle Elemente im aktuellen Projekt anzeigt werden.
	Ansicht / Vorherige Ansicht	Zeigt eine vorherige Bildschirmansicht an.
	Ansicht / Layer	Blendet verschiedene Layer ein oder aus.
	Ansicht / Zusatzfenster	Öffnet das Zusatzfenster, das eine maßstabsmäßig kleinere Ansicht der in der aktuellen Ansicht gewählten Elemente bietet. Sie können die Größe dieses Fensters ändern und es verschieben.


Oberflächen-Symbolleiste

Die Oberflächen-Symbolleiste bietet Symbol, die Ihnen helfen, die DTMLink™ Software noch effizienter einzusetzen.

Die folgenden Optionen sind in der Oberflächen-Symbolleiste für die Bearbeitung von Oberflächen verfügbar:

Schaltfläche	Menübefehl	Beschreibung
	Entwurf / Punkt einschließen	Schließt einen Punkt in das Oberflächenmodell ein
	Entwurf / Punkt ausschließen	Schließt einen Punkt aus dem Oberflächenmodell aus
	Entwurf / Linie hinzufügen	Entfernt Oberflächenanteile, die außerhalb einer Begrenzung liegen. Sie können mit diesem Symbol zudem eine Begrenzung mit einer Bruchkante definieren.
	Entwurf / Linie hinzufügen	Entfernt einen Oberflächenbereich, der innerhalb einer Begrenzung liegt. Sie können mit diesem Symbol zudem eine Begrenzung mit einer Bruchkante definieren.
	Entwurf / Linie hinzufügen	Fügt eine Bruchkante zwischen zwei Punkten hinzu
	Entwurf / Löschen	Löscht eine Bruchkante oder Begrenzung Drücken Sie den Pfeil rechts neben der Schaltfläche, um den zu löschenden Linientyp zu wählen. Die Optionen im Pulldown-Menü sind: Alle Bruchkanten Begrenzungen einschließen Begrenzungen ausschließen Begrenzungen und Bruchkanten einschließen Begrenzungen und Bruchkanten ausschließen
	Entwurf / Dreiecke auswechseln	Wechselt zwei benachbarte Dreiecke aus, die ein konvexes Viereck formen
	Entwurf / Dreieck löschen	Schließt ein Dreieck aus dem Oberflächenmodell aus

Das Symbol bleibt aktiviert, bis Sie ein anderes Symbol wählen.


Verknüpfungsmenüs

Verwenden Sie, wenn Sie sich in einem Graphikfenster befinden, die rechte Maustaste, um ein Verknüpfungsmenü anzusehen. Dies ist ein kontext-sensitives Menü mit verschiedenen Optionen. Die Optionen sind abhängig von dem Kontext, in dem Sie die rechte Maustaste drücken.

Die wichtigsten verfügbaren Kontextoptionen sind:

Graphik-Hauptfenster

Das Verknüpfungsmenü im Graphik-Hauptfenster ist:


Tastenkombinationen

Sie können die Maus verwenden, um einen beliebigen Menübefehl zu wählen, auf den Sie von der Menüleiste aus zugreifen können. Sie können aber auch die Tastatur verwenden.

Für die meisten Verknüpfungen betätigen Sie Alt, dann den ersten Buchstaben der Menübezeichnung und daraufhin den ersten Buchstaben des Befehls. Sie können zudem vertraute Microsoft Windows-Verknüpfungen für die gebräuchlichsten Befehle wie Öffnen, Speichern, Beenden und Rückgängig verwenden.

MENÜ	TASTENKOMBINATION
Datei
Öffnen	Strg + O
Speichern	Strg + S
Beenden	Alt + X
Bearbeiten
Rückgängig	Strg + Z
Ansicht
Zoom-Ausdehnung	Strg + E
Aktualisieren	F5
Eigenschaftsfenster	Alt + Eingabe
Entwurf
Oberfläche aktualisieren	F4
Verknüpfungsmenü
Auswahlmodus	F2


Berichte ansehen

Die DTMLink™ Software erzeugt Berichte (z. B. Volumenberichte und Berichte über sich überkreuzende Bruchkanten).

Berichte werden gemäß Voreinstellung unter C:\Trimble Geomatics Office\Projekte\xx\DTMLink\yy gespeichert, wobei xx die Projektbezeichnung ist und yy der Name der Oberfläche ist.

Sie können sich den Bericht später ansehen, indem Sie ihn mit dem Microsoft Windows Explorer in diesem Ordner öffnen.


Graphische Auswahl

Verwenden Sie die graphische Auswahl in einem beliebigen Graphikfenster (einschließlich dem Zusatzfenster), um  Werte in Dialogfelder einzugeben. Um z. B. Werte in das Dialogfeld Punkt ausschließen einzugeben, klicken Sie auf einen Punkt auf der Oberfläche.

In Feldern, die die graphische Auswahl unterstützen, sieht der Mauszeiger im Graphikfenster folgendermaßen aus:

HINWEIS: Wenn das Element, das Sie im Graphikfenster wählen, den für das hervorgehobene Feld erforderlichen Wert bietet, bleibt das Feld im Dialogfeld unverändert.

Betätigen Sie die Maustaste, und halten Sie sie gedrückt, um Werte voranzuzeigen, zu ermitteln und zu überprüfen, bevor Sie sie kopieren. Die Felder zeigen die Werte an, und die Statusleiste zeigt eine Zusammenfassung der Elemente an, wenn Sie die Maus ziehen. Werte werden nur kopiert, wenn Sie die Maustaste freigeben.

Einige Felder werden als Wertegruppe ergänzt. Durch einfaches Klicken werden alle gruppierten Felder ergänzt. Hochwert- und Rechtswert-Felder bilden gewöhnlich eine Gruppe. Um nur ein Feld zu ergänzen, wählen Sie es, halten Sie Alt gedrückt, und klicken daraufhin einmal.

Die Cursor-Aktivität wird nach der Verwendung der graphischen Auswahl zum nächsten Feld verlegt.

TIPS:

Wenn Sie Strg gedrückt halten, während Sie die graphische Auswahl einsetzen, wird die Anpassung an Elemente vermieden, und es werden nur Koordinaten gewählt. Sie können auf diese Weise Koordinaten wählen, die sich in der Nähe eines Elements befinden.

Sie können die Befehle im Menü Ansicht (z. B. Zoom und Verschieben) verwenden, um Elemente mit den für die graphische Auswahl gewünschten Werten zu ermitteln. Sobald diese ermittelt sind, müssen Sie Ihren Blickpunkt wieder auf das Feld richten, bevor Sie den Wert kopieren.


Titelleiste

Die Titelleiste erstreckt sich entlang des oberen Bildschirmbereichs oberhalb der Menüleiste.


Menüleiste

Die Menüleiste befindet sich unterhalb der Titelleiste. Sie enthält die folgenden Menüs:

Datei

Bearbeiten

Ansicht

Entwurf

Hilfsmittel

Fenster

Hilfe

Einen Befehl wählen

Um einen Befehl aus einem Menü zu wählen, klicken Sie mit der Maus darauf.

Tastenkombination

Sie können die Maus verwenden, um einen beliebigen Menübefehl zu wählen, auf den Sie von der Menüleiste aus zugreifen können. Sie können aber auch die Tastatur verwenden.

Falls Sie es vorziehen, die Tastatur zu benutzen, betätigen Sie Alt und den unterstrichenen Buchstaben, der dem gewünschten Menü entspricht. Betätigen Sie daraufhin den unterstrichenen Buchstaben, der dem gewünschten Befehl entspricht, oder setzen Sie die Auf- und Abwärtspfeile ein, und drücken Sie Eingabe, um die Auswahl durchzuführen.

TIP: Sie können zudem vertraute Microsoft Windows-Verknüpfungen für die gebräuchlichsten Befehle wie Öffnen und Speichern verwenden.

 Siehe auch


Statusleiste

Die Statusleiste zeigt eine Reihe von unterschiedlichen Meldungen an und stellt unmittelbares und präzises Feedback über den aktuellen Status der DTMLink™ Software zur Verfügung.

Die Statusleiste wird im unteren Bereich des Graphik-Hauptfensters der DTMLink Software angezeigt, siehe Abb. 1.

Abb. 1  Statusleiste

Fensterausschnitt Meldungen

Der Fensterausschnitt Meldungen in der Statusleiste zeigt Information über die Bedienung der DTMLink Software an.

Dieses Fenster beschreibt Vorgänge von Menüelementen, sobald diese hervorgehoben werden. Die Meldung “Öffnet eine Oberfläche” erscheint z. B., wenn der Befehl Datei / Oberfläche öffnen hervorgehoben ist. Das Fenster zeigt zudem Meldungen an, die die Vorgänge von Schaltflächen auf der Symbolleiste beschreiben, wenn Sie sich mit dem Mauszeiger darauf bewegen. Die Meldung “Verschiebt die Mitte des Zoom-Bereichs” wird z. B. angezeigt, wenn Sie den Mauszeiger über dem Symbol Verschieben auf der Ansicht-Symbolleiste positionieren.

Fensterausschnitt Koordinaten

Wenn sich die Maus innerhalb eines Graphikfensters befindet, werden die entsprechenden Koordinaten angezeigt.

Fensterausschnitt Ausdehnung

Dieser Fensterausschnitt zeigt die Breite und Höhe des Graphikfensters an, über dem sich die Maus befindet.

Fensterausschnitt Anzeige

Wenn eine Änderung vorgenommen wurde, und eine Aktualisierung notwendig ist, wird der Fensterausschnitt Anzeige hervorgehoben. Wenn zusätzliche Bruchkanten oder Begrenzungen zu der Oberfläche hinzugefügt wurden, erscheint die Anzeige Oberfläche aktualisieren in diesem Fensterausschnitt (wie in der obigen Abbildung dargestellt), und Sie müssen die Oberfläche aktualisieren.

Fensterecke

Mit der Fensterecke können Sie die Größe des Graphik-Hauptfensters ändern.


Tips

Die folgenden Themen sind verfügbar:

Die Symbolleisten verwenden

Verknüpfungsmenüs

Tastenkombinationen

Berichte ansehen

Graphische Auswahl

Titelleiste

Menüleiste

Statusleiste

Standard-Symbolleiste

Ansicht-Symbolleiste

Oberflächen-Symbolleiste


Volumenbericht
Hilfsmittel / Volumenbericht

Verwenden Sie diesen Befehl, um einen Volumenbericht für die aktuelle Oberfläche zu erstellen.

Berichttyp

Wählen Sie den Volumenberichttyp für die aktuelle Oberfläche aus dem Kästchen Berichttyp.

Verfügbare Volumenberechnungstypen sind:

Oberhalb einer Höhe

Verwenden Sie die Option Oberhalb einer Höhe für Halden-/Abraumberechnungen.

HINWEIS: Es wird angenommen, daß sich die Halde auf horizontaler Basis befindet.

Zwischen zwei Höhen

Verwenden Sie die Option Zwischen zwei Höhen für die Volumenberechnung von Materialien in horizontalen Layern.

Ungültiges Volumen

Verwenden Sie die Option Ungültiges Volumen für die Volumenberechnung leerer Volumen zwischen zwei festgelegten Höhen. Mit anderen Worten, das ungültige Volumen ist das Volumen zwischen zwei angegebenen Höhenlinienhöhen, das nicht unterhalb des Höhenlinienmodells eingeschlossen ist.

Obere Höhe

Die obere Höhe definiert die maximale Höhe, bis zu der das Volumen berechnet werden soll. Der in diesem Feld angezeigte Voreinstellungswert ist der höchste Punkt im Höhenlinienmodell. Dieses Feld ist verfügbar, wenn die obere Höhe für die Volumenberechnung benötigt wird.

TIP: Klicken Sie auf Höchste/r/s, um den maximalen Höhenwert des Höhenlinienmodells zu wählen.

Basishöhe

Die Basishöhe definiert die niedrigste Höhe, bis zu der das Volumen berechnet werden soll. Der Voreinstellungswert in diesem Feld ist der niedrigste Punkt im Höhenlinienmodell.

TIP: Klicken Sie auf Tiefste/r/s, um den minimalen Höhenwert des Höhenlinienmodells zu wählen.

Schrumpfung/Umfang

Die Option Schrumpfung/Umfang bestimmt, ob die angegebenen Volumen für die Verdichtung (Schrumpfung) oder Erweiterung der Materialien (Umfang) korrigiert werden. Die Option schaltet zwischen Schrumpfung und Umfang hin und her.

HINWEIS: Für Rohvolumen (Volumen ohne Schrumpfung und Umfang) geben Sie den Wert Null in das Feld Prozent ein.

Prozent

Geben Sie den tatsächlichen Schrumpfungs- oder Umfangsfaktor (als Prozentsatz ausgedrückt) in das Feld Prozent ein.

Die DTMLink™ Software gibt z. B. das Volumen  als Rohvolumen abzüglich 10% an, wenn die Option Schrumpfung gewählt ist, und das Feld Prozent einen Wert von zehn Prozent (10%) aufweist.

Das heißt, daß die DTMLink Software, bei einem Rohvolumen von 600 Kubikmetern, gewählter Option Schrumpfung und einem Schrumpfungsfaktor von zehn Prozent, das Volumen als 540 Kubikmeter angibt.


Oberhalb einer Höhe

Die Option Oberhalb einer Höhe berechnet das Volumen oberhalb einer angegebenen Höhe zu dem höchsten Punkt im Höhenlinienmodell. Die Volumen individueller dreieckiger Prismen, die durch die dreieckigen Ebenen des Digitalen Geländemodells (DGM) definiert sind, werden berechnet.

Die Methode berechnet

  Volumen oberhalb einer Ebene (festgelegte Basishöhe)

  Projektierte Fläche

  Oberflächenbereich.

Abb. 1 zeigt die prismoidale Volumenberechnungsmethode an.

Abb. 1 Prismoidale Volumenberechnungsmethode

Das Volumen des Prismas (Vp) wird mit Hilfe der Prismenvolumengleichung berechnet:

wobei:

H1 die Höhe des ersten Punktes ist

H2 die Höhe des zweiten Punktes ist

H3 die Höhe des dritten Punktes ist

BE die Höhe der Basis-Nivellierung ist

P   die projektierte Fläche ist.

Die projektierte Fläche ist der Flächenbereich des Oberflächendreiecks, das auf eine Ebene projiziert wurde.

Die projektierte Fläche (P) wird mit Hilfe der Gleichung Projektierte Fläche berechnet:

wobei:

die Länge des Basis-Dreiecks ist, von Gitter-Koordinaten berechnet

die Höhe des Basis-Dreiecks ist, von Gitter-Koordinaten berechnet.

Das Volumen jedes Dreiecksprismas wird individuell berechnet und dann zusammengefaßt, um das Gesamtvolumen innerhalb der Begrenzungsfläche des Modells anzugeben. Wenn eine angegebene Basishöhe ein Dreieck durchschneidet, wird das Prismenvolumen des Dreiecksanteils berechnet, der sich oberhalb der Basishöhe befindet.

 Siehe auch


Volumenberechnungsbeispiel Oberhalb einer Höhe

Eine gebräuchliche Anwendung für die Volumenberechnungsmethode Oberhalb einer Höhe besteht in der Überwachung der regelmäßigen Auffüllungen von Mülldeponien und anderen ähnlichen Flächenbereichen. Die grundlegenden Schritte sind wie folgt:

Schritt 1. Definieren Sie eine gemeinsame Begrenzung für die in Frage kommende Fläche, siehe Abb. 1.

Abb. 1  Anwendung Gebietsauffüllung – Gesamte Fläche

Schritt 2. Begrenzen Sie das ursprüngliche, den gesamten Flächenbereich abdeckende Höhenlinienmodell unter Verwendung einer einschließenden Begrenzung. Die Höhenliniendaten müssen sich mindestens bis zu dieser einschließenden Begrenzung erstrecken, siehe Abb. 2.

Abb. 2  Anteil des ursprünglichen Oberflächenmodells

Schritt 3. Berechnen Sie das Volumen zwischen der Basishöhe und dem ursprünglichen Höhenlinienmodell, siehe Abb. 3.

Abb. 3  Volumen unterhalb der ursprünglichen Oberfläche

Schritt 4. Erstellen Sie das zweite Höhenlinienmodell, das die Punkte enthält, die die aufgefüllte Fläche definieren. Begrenzen Sie dieses neue Höhenlinienmodell unter Verwendung der ursprünglichen Definition der einschließenden Begrenzung. Auch hierbei müssen sich die Höhenliniendaten mindestens bis zu dieser Begrenzung erstrecken, siehe Abb. 4.

Abb. 4  Neues Höhenlinienmodell

Schritt 5. Berechnen Sie das Volumen zwischen der Basishöhe, die für die erste Oberfläche verwendet wurde, und der neuen Oberfläche, siehe Abb. 5.

Abb. 5  Volumen unterhalb der neuen Oberfläche

Schritt 6. Berechnen Sie das Volumen unterhalb der ursprünglichen Oberfläche (siehe 3 in Abbildung 6) aus dem Volumen unterhalb der neuen Oberfläche.

Abb. 6  Das berechnete Volumen

 Siehe auch


Zwischen zwei Höhen

Die Option Zwischen zwei Höhen läßt Sie das Volumen zwischen einer oberen Höhe und einer niedrigeren Höhe berechnen. Dieselbe Volumenberechnungsmethode verwendet die prismoidale Volumenberechnungsmethode wie bei der Methode Oberhalb einer Höhe erläutert.

Die Option Zwischen zwei Höhen wird für die Volumenberechnung des gewählten Höhenlinienmodells zwischen zwei angegebenen Konturhöhen verwendet.

Abb. 1 zeigt das zu berechnende Volumen zwischen zwei Höhen an.

Abb. 1  Volumen zwischen zwei Höhen

Obere Höhe

Abb. 1 zeigt das Volumen oberhalb der oberen Höhe an. Dies ist die Höhe, oberhalb der das Volumen nicht erforderlich ist. Der Voreinstellungswert in diesem Feld ist der höchste Punkt im Höhenlinienmodell.

Geben Sie die Höhe ein, unterhalb der das Volumen in dem Feld Obere Höhe zu berechnen ist.

Basishöhe

Das obige Diagramm zeigt das Volumen oberhalb der niedrigeren Höhe an. Die Basishöhe definiert die Höhe, unterhalb derer das Volumen nicht erforderlich ist. Der Voreinstellungswert in diesem Feld ist der niedrigste Punkt im Höhenlinienmodell.

Geben Sie die Höhe ein, oberhalb der das Volumen in dem Feld Basishöhe zu berechnen ist.


Ungültiges Volumen

Diese Option wird für die Berechnung von Leervolumen zwischen zwei angegebenen Höhen verwendet. Mit anderen Worten, das ungültige Volumen ist das Volumen zwischen zwei angegebenen Konturhöhen, das nicht unterhalb der Oberfläche des Höhenlinienmodells eingeschlossen ist.

Um die Option Ungültiges Volumen zu verwenden, legen Sie eine Basishöhe fest, die sich unterhalb des unteren Randes des Modells befindet, und eine obere Höhe, die die horizontale Oberfläche definiert, bis zu der Sie auffüllen möchten, siehe Abb. 8.

Abb. 8  Berechnung des ungültigen Volumens

Das Volumen oberhalb der Basishöhe ist das Gesamtvolumen oberhalb dieser Höhe (einschließlich des Volumens oberhalb der oberen Höhe).

Das ungültige Volumen wird mit Hilfe der folgenden Formel berechnet:

Ungültiges Volumen = BA x (UE – BE) – (BV – UV)

wobei:

BA die projektierte Fläche oberhalb der Basishöhe ist

UE die Obere Höhe ist

BE die Basishöhe ist

BV das Volumen oberhalb der Basishöhe ist

UV das Volumen oberhalb der Oberen Höhe ist

Obere Höhe

Abb. 8 zeigt, daß die obere Höhe den oberen Bereich des ungültigen Volumens definiert. Der in diesem Feld angezeigte Voreinstellungswert ist der höchste Punkt im Höhenlinienmodell.

Basishöhe

Abb. 8 zeigt, daß sich die Basishöhe unterhalb des unteren Bereichs des ungültigen Volumens befindet. Der in diesem Feld angezeigte Voreinstellungswert ist der niedrigste Punkt im Höhenlinienmodell.

 Siehe auch


Beispiel Ungültiges Volumen

Die Methode Ungültiges Volumen kann für die Berechnung des Wasservolumens hinter einem geplanten Damm eingesetzt werden.

Die Berechnungsschritte für das Wasservolumen sind:

Schritt 1. Erstellen Sie ein Höhenlinienmodell mit Hilfe der Daten, die die Bodenfläche hinter dem geplanten Damm definieren. Definieren Sie bei der Erstellung des Modells eine einschließende Begrenzung, die das Höhenlinienmodell auf die Wasserfläche hinter dem Damm begrenzt. Auf diese Weise wird sichergestellt, daß sich das berechnete Wasservolumen hinter dem Damm befindet.

Schritt 2. Berechnen Sie das ungültige Volumen, wobei Sie den gewünschten Wasserpegel als die obere Höhe angeben.

Abb. 1 zeigt ein Beispiel einer Flächenberechnung für ein ungültiges Volumen, zusammen mit einem Beispielquerschnitt durch den Dammrand, der das berechnete ungültige Volumen angibt.

Die Ergebnisse der Berechnung des ungültigen Volumens liefern das Wasservolumen zwischen der angegebenen Basishöhe (die so gewählt werden muß, daß sie niedriger als der niedrigste Punkt hinter dem Damm ist) und der oberen Höhe (Wasserpegel). Dieses leere/ungültige Volumen ist tatsächlich das Volumen der Wassermassen, die sich oberhalb der Oberfläche, aber unterhalb des angegebenen Wasserpegels befinden, und ist demzufolge das erforderliche Volumen. Siehe Abb. 1.

Abb. 1 : Beispiel

 Siehe auch


Oberfläche neu aufbauen
Hilfsmittel / Oberfläche neu aufbauen

Verwenden Sie diesen Befehl, um die Oberfläche aus den ursprünglichen Oberflächenpunkten neu aufzubauen. Alle Oberflächenpunkte oder Dreiecke, die aus dem Höhenlinienmodell entfernt wurden, werden wiederhergestellt. Dieser Befehl verwendet die Begrenzungen und Bruchkanten, die nach dem Import der ursprünglichen Oberflächenpunkte erzeugt wurden.

ACHTUNG: Ausgewechselte oder gelöschte Dreiecke werden nach dem Neuaufbau einer Oberfläche nicht beibehalten. Ausgeschlossene Punkte erscheinen wieder, nachdem die Oberfläche neu aufgebaut ist.


Oberflächen vergleichen
Hilfsmittel / Oberflächen vergleichen

Mit der Option Oberflächen vergleichen können Sie einen Vergleich zwischen zwei ausgewählten Oberflächen erstellen. Die erzeugte oder Vergleichsoberfläche ist ein Höhenlinienmodell der Höhenunterschiede zwischen der Hauptoberfläche und der Basisoberfläche. Sie können die Vergleichsoberfläche verwenden, um das Volumen zwischen den beiden Oberflächen zu berechnen.

 Siehe auch

Hauptoberfläche

Wählen Sie die benötigte Hauptoberfläche aus der Dropdown-Liste. Verwenden Sie das Feld In Ordner, um den entsprechenden Ordner auszuwählen.

 Siehe auch

Basisoberfläche

Wählen Sie die benötigte Basisoberfläche aus der Dropdown-Liste. Verwenden Sie das Feld In Ordner, um den entsprechenden Ordner auszuwählen.

 Siehe auch

Neue Oberfläche

Geben Sie den Namen der Vergleichsoberfläche ein. Der Name muß im aktuellen Projekt einmalig sein.

Vergleichsmethode

Wählen Sie die Vergleichsmethode. Wählen Sie eine der folgenden Optionen:

  Einfach

  Detailliert

 Siehe auch


Das Volumen zwischen zwei Oberflächen berechnen

Mit der Option Ungültiges Volumen können Sie das Abtrags- und Auftragsvolumen zwischen zwei Oberflächen mit Hilfe einer Vergleichsoberfläche berechnen. Die Basisoberfläche ist auf den niedrigsten Punkt im Höhenlinienmodell eingestellt; die Obere Höhe ist auf Null eingestellt. Die Null-Höhenlinien geben einen Wechsel von einer Abtrags- zu einer Auftragsfläche an. Dies bedeutet, daß das berechnete Volumen über der Oberen Höhe der Summe der Volumen aller Auftragsflächen entspricht. Die Summe der Volumen aller Abtragsflächen wird im ungültigen Volumen zwischen der Basishöhe und der Oberen Höhe angegeben.

Wenn das Volumen einer bestimmten Abtrags- oder Auftragsfläche benötigt wird, kann dieses berechnet werden, indem eine einschließende Begrenzung um den Bereich definiert wird, für den das individuelle Volumen benötigt wird. Das Modell wird dann erneut gebildet, und die Option Ungültiges Volumen wird auf das Modell angewandt. Die Basishöhe wird dabei wieder auf den niedrigsten Punkt im Höhenlinienmodell und die Obere Höhe auf Null eingestellt. Wenn die jeweilige Fläche eine Auftragsfläche ist, wird das Auftragsvolumen als das Volumen oberhalb der Oberen Höhe wiedergegeben. Wenn es sich bei der Fläche um eine Abtragsfläche handelt, wird das berechnete Abtragsvolumen als Ungültiges Volumen zwischen der Oberen Höhe und der Basishöhe angegeben.

 Siehe auch


Hauptoberfläche und Basisoberfläche

Die Auswahl der Hauptoberfläche und der Basisoberfläche definiert die Richtung der Höhenunterschiede.

Das bedeutet, daß jede Fläche auf der Hauptoberfläche, die höher als die entsprechende Fläche auf der Basisoberfläche ist, als Fläche mit positiver Höhe angezeigt wird.

Jede Fläche auf der Hauptoberfläche, die niedriger als die Basisoberfläche ist, wird als Fläche mit negativer Höhe dargestellt. Flächen, die nur auf einer der beiden Oberflächen enthalten sind, erscheinen nicht auf der Vergleichsoberfläche.


Vergleichsmethode

Wählen Sie die Vergleichsmethode:

Einfach

Dies ist ein zweifacher Punkt-zu-Oberflächen-Vergleich. Alle Punkte auf der Haupt- und der Basisoberfläche werden auf die andere Oberfläche projiziert, und ein Höhenunterschied wird berechnet. Dieser Höhenunterschied und die Koordinatenposition bilden die Modellkoordinaten für die Vergleichsoberfläche. Wenn die Höhenlinien erzeugt werden, stellt die Vergleichsoberfläche die Abtrags-Auftrags-Beziehung zwischen den verglichenen Oberflächen dar, siehe Abb. 1.

Abb. 1 : Einfacher Oberflächenvergleich

Detailliert

Bei einem detaillierten Vergleich wird anfänglich derselbe Vorgang durchgeführt, wie für einen einfachen Vergleich. Zusätzlich dazu wird beim detaillierten Vergleich an jedem Punkt, an dem sich eine Seite eines Oberflächendreiecks  mit der Seite eines Dreiecks von der anderen Oberfläche überschneidet, eine Vergleichskoordinate in der horizontalen Ebene erstellt. Mit Hilfe dieser Methode erhalten Sie maximale Informationen von beiden Modellen. Die daraus resultierende Vergleichsoberfläche ist detaillierter, da sie Dreiecksformationen (und daher Bruchkanteninformationen) beider Oberflächen verwendet. Die Erstellung eines Oberflächenvergleichs mit der detaillierten Methode dauert länger als die Erstellung eines Vergleichs mit der einfachen Methode, siehe Abb. 2.

Abb. 2 : Detaillierter Oberflächenvergleich

HINWEIS: Alle Bruchkanten und Begrenzungen (sowohl auf der Haupt- als auch der Basisoberfläche) werden bei der Berechnung der Vergleichsoberfläche ignoriert. Falls Begrenzungen benötigt werden, müssen diese nach dem Vergleichsvorgang hinzugefügt und die Vergleichsoberfläche danach aktualisiert werden. Es ist nicht möglich, Bruchkanten auf einer Vergleichsoberfläche zu definieren. Unter Verwendung der Option Linie Hinzufügen können Sie zwar Bruchkanten auf einer aktualisierten Vergleichsoberfläche hinzufügen, das Ergebnis ist jedoch nicht korrekt und unbedeutend. Der Grund dafür ist, daß die Vergleichsoberfläche aus Vergleichspunkten modelliert wird, deren Höhe Unterschiede zwischen Datenbankpunkten und Bruchkanten wiedergeben, die nur mit Datenbankpunkten definiert werden können.


Menü "Hilfsmittel"
Menü “Hilfsmittel”

Verwenden Sie das Menü “Hilfsmittel“, um Berechnungen durchzuführen und mit den Daten zu verarbeiten. Es verfügt über die folgenden Befehle:

Volumenbericht

Oberfläche neu aufbauen

Oberflächen vergleichen


Vergrößern
Ansicht / Vergrößern

	Klicken Sie auf das Symbol Vergrößern auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um einen Teil des Graphikfensters genauer einzusehen.

Wenn das Symbol Vergrößern gewählt ist:

1.	Bewegen Sie den Zeiger über das Graphikfenster. Der ein Pluszeichen einschließende Vergrößerungsglaszeiger erscheint. Fadenkreuze oberhalb des Vergrößerungsglaszeigers markieren die gewünschte Stelle.

2.	Führen Sie einen der folgenden Vorgänge durch:

 Klicken Sie auf eine Position im Graphikfenster, um eine zweifache Vergrößerung mit der gewünschten Stelle im Mittelpunkt zu erhalten.

 Klicken und ziehen Sie den Zeiger über das Graphikfenster, um dadurch ein Rechteck zu erzeugen, das die Fläche enthält, die Sie vergrößern möchten. Je kleiner die Fläche ist, desto größer ist die Maßstabsänderung. Die in dem Rechteck enthaltene Fläche nimmt das gesamte Graphikfenster ein, wenn die Maustaste losgelassen wird.

HINWEISE:

Betätigen Sie Esc, während die linke Maustaste gedrückt ist, um den aktuellen Vergrößerungsvorgang abzubrechen.

Wenn Sie die Taste Umschalt gedrückt halten, während der Zoom-Vorgang durchgeführt wird, wird ein Zusatzfenster des Zoom-Bereichs geöffnet.


Verkleinern
Ansicht / Verkleinern

	Klicken Sie auf das Symbol Verkleinern auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um eine größere Fläche innerhalb eines Graphikfensters anzusehen.

Wenn das Symbol Verkleinern gewählt ist:

1.	Bewegen Sie den Zeiger über das Graphikfenster. Der ein Minuszeichen einschließende Vergrößerungsglaszeiger erscheint. Fadenkreuze oberhalb des Vergrößerungsglaszeigers markieren die gewünschte Stelle.

2.	Führen Sie einen der folgenden Vorgänge durch:

 Klicken Sie auf eine Position in dem Graphikfenster. Der Maßstab des Graphikfensters ändert sich, und die gewünschte Stelle erscheint im Mittelpunkt.

 Klicken und ziehen Sie den Zeiger über das Graphikfenster, um dadurch ein Rechteck zu erzeugen, das die Fläche enthält, die Sie verkleinern möchten, und geben Sie dann die Maustaste frei. Der Maßstab des Graphikfensters ändert sich, und die zuvor in dem Rechteck enthaltene Fläche wird angezeigt. Um die Verkleinerung abzubrechen, kehren Sie zum Ausgangspunkt zurück, bevor Sie die Maustaste freigeben.

HINWEISE:

Betätigen Sie Esc, während die linke Maustaste gedrückt ist, um den aktuellen Verkleinerungsvorgang abzubrechen.

Klicken und ziehen Sie ein Rechteck auf dem Graphikfenster. Wenn der Verkleinerungsvorgang durchgeführt wird, enthält das Rechteck die vorherige Ansicht. Je kleiner das Rechteck, desto größer ist die Maßstabsänderung.


Verschieben
Ansicht / Verschieben

	Klicken Sie auf das Symbol Verschieben auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um den Inhalt des Graphikfensters zu verschieben, damit eine andere Fläche der Bildschirmanzeige dargestellt werden kann. Das Symbol Verschieben verschiebt die ursprüngliche Ansicht.

Wenn Sie das Symbol Verschieben gewählt haben:

1.	Bewegen Sie den Zeiger über das Graphikfenster. Der Handzeiger erscheint. Fadenkreuze oberhalb des Handzeigers markieren die gewünschte Stelle.

2.	Führen Sie einen der folgenden Vorgänge durch:

 Klicken Sie auf eine Position in dem Graphikfenster. Diese Position wird zum neuen Mittelpunkt des Fensters.

 Klicken und ziehen Sie den Handzeiger in die Richtung und zu der Position, zu der Sie verschieben möchten. Eine Linie erscheint, die die Richtung und das Ausmaß der Bildschirmverschiebung anzeigt. Geben Sie die Maustaste frei. Die Bildschirmansicht wird zu dieser neuen Position verschoben. Um die Verschiebung abzubrechen, kehren Sie mit dem Handzeiger zur Ausgangsposition zurück, bevor Sie die Maustaste freigeben.

HINWEIS: Um den aktuellen Verschiebevorgang abzubrechen, drücken Sie Esc, während Sie die linke Maustaste gedrückt halten.


Verschieben zu
Ansicht / Verschieben zu

Verwenden Sie diesen Befehl, um die Ansicht zu einer bestimmten Stelle im Graphikfenster zu verschieben und zu skalieren.

Das Dialogfeld Verschieben zu wird geöffnet.

Ansichtsmitte

Mit den Feldern in dieser Gruppe können Sie Vorgänge mit der graphischen Auswahl abschließen, wie z .B. die Angabe einer Bezeichnung oder einer Position für die Ansichtsmitte.

Punktname	Verwenden Sie dieses Feld, um den Namen des Punktes in der Ansichtsmitte einzugeben. Die Felder Rechtswert und Hochwert werden automatisch aktualisiert.
Rechtswert/Hochwert	Verwenden Sie diese Felder, um die Ansichtsmitte einzugeben, wenn Sie den Punktnamen nicht kennen.

Ansichtsradius

Das Feld Ansichtsradius legt die Position der aktuellen Ansicht fest.

Die Bildschirmmitte wird um die Streckenlänge des angegebenen Radius verschoben. Die Strecke hängt von der Orientierung des Graphikfensters ab. Abb. 1 verdeutlicht dies:

Abb. 1 : Orientierung auf dem Bildschirm


Zoom-Ausdehnung
Ansicht / Zoom-Ausdehnung

	Klicken Sie auf das Symbol Zoom-Ausdehnung auf der Ansicht-Symbolleiste
Verwenden Sie diesen Befehl, um alle sichtbaren Punkte auf der aktuellen Oberfläche anzusehen.

Wenn Sie den Befehl Zoom-Ausdehnung wählen, paßt sich das Graphikfenster automatisch an, so daß alle Daten sichtbar sind.


Vorherige Ansicht
Ansicht / Vorherige Ansicht

	Klicken Sie auf das Symbol Vorherige Ansicht auf der Ansicht-Symbolleiste
Verwenden Sie diesen Befehl, um die vorherigen Ansichten durchzugehen.


Zusatzfenster
Ansicht / Zusatzfenster

	Klicken Sie auf das Symbol Zusatzfenster auf der Ansicht-Symbolleiste

Verwenden Sie diesen Befehl, um das Zusatzfenster anzuzeigen. Wenn das Zusatzfenster geöffnet ist, verbleibt es immer im Vordergrund.

Das Zusatzfenster bietet eine andere Ansicht. Wie bei anderen Graphikfenstern, können Sie die graphische Auswahl, Auswahl- und Zoom-Funktionen innerhalb des Zusatzfensters verwenden.

Dies bedeutet, daß Sie das Zusatzfenster zum Beispiel als Symbol einsetzen können, um eine Vogelperspektive des Graphikfensters zu erhalten. Beide Fenster können für gebräuchliche Vorgänge (wie z. B. graphische Auswahl, Auswahl- und Zoom-Funktionen) eingesetzt werden.

HINWEIS: Sie können den Befehl Ansicht / Zoom-Ausdehnung im Graphikfenster verwenden. Wenn Sie eine Zoom-Ausdehnung im Zusatzfenster durchführen möchten, klicken Sie auf Verknüpfungsmenü.

Um eine vergrößerte Ansicht im Zusatzfenster zu erhalten, wählen Sie das Symbol Vergrößern. Legen Sie die zu vergrößernde Fläche im Graphikfenster fest, indem Sie die Umschalttaste gedrückt halten und mit dem Symbol Vergrößern ziehen.

Um eine vergrößerte Ansicht im Graphikfenster zu erhalten, wählen Sie das Symbol Vergrößern. Legen Sie die zu vergrößernde Fläche im Zusatzfenster fest, indem Sie die Umschalttaste gedrückt halten und den Punkt im Graphikfenster wählen, von dem aus vergrößert werden soll. Dies demonstriert, wie das Zusatzfenster zur Ansicht des Bildschirms aus der Vogelperspektive eingesetzt werden kann.

HINWEIS: Die Titelleiste des Zusatzfensters ist aktiv, wenn das assoziierte Graphikfenster aktiviert ist.


Symbolleisten
Ansicht / Symbolleisten

Verwenden Sie diesen Befehl, um Symbolleisten anzuzeigen oder zu verbergen.

Jede der Symbolleisten besteht aus einer Reihe von Symbolen, die durch Schaltflächen repräsentiert werden. Jedes Symbol steht als Menübefehl zur Verfügung.

Symbolleisten

Wählen Sie das Kontrollkästchen, um eine Symbolleiste anzuzeigen oder zu verbergen. Eine Kontrollmarkierung weist auf die Sichtbarkeit der Symbolleiste hin.

Schließen

Klicken Sie auf Schließen, um das Dialogfeld zu verlassen.

Alle

Klicken Sie auf Alle, um alle Symbolleisten anzuzeigen.

Keine

Klicken Sie auf Keine, um alle Symbolleisten zu verbergen.

Zurücksetzen

Klicken Sie auf Zurücksetzen, um die Symbolleisten voreinstellungsgemäß wiederherzustellen.

 Siehe auch


Layer
Ansicht / Layer

	Klicken Sie auf das Symbol Layer-Sichtbarkeit auf der Ansicht-Symbolleiste.
Verwenden Sie diesen Befehl, um die Layer in der aktuellen Ansicht anzuzeigen oder zu verbergen.

Wenn Sie einen bestimmten Layer anzeigen oder verbergen, zeigt die DTMLink™ Software die Elemente darin an oder blendet sie aus.

HINWEIS: Das Ein- oder Ausblenden eines Layer in der DTMLink Software ist mit dem Ein- oder Ausschalten eines Layers in AutoCAD vergleichbar. Das Ausschalten eines Bruchkanten-Layers bewirkt nicht, daß dieser Layer nicht für die Aktualisierung der Oberfläche verwendet werden kann. Das Oberflächenmodell wird dadurch nicht beeinflußt, nur die Ansicht.

Layer

Die Liste Layer zeigt die Bezeichnungen aller Layer auf der Oberfläche an. Eine Kontrollmarkierung weist darauf hin, daß der Layer sichtbar ist. Wählen Sie das Kontrollkästchen für einen bestimmten Layer, um den Layer ein- oder auszublenden.

Alle

Klicken Sie auf Alle, um alle Layer in der Liste anzuzeigen.

Keine

Klicken Sie auf Keine, um alle Layer in der Liste auszublenden.

TIP: Wenn die Sichtbarkeit aller Layer ausgeschaltet wird, werden auf dem Bildschirm keine Elemente angezeigt.

HINWEIS: Der Layer-Indikator in der Fenster-Anzeige wird hervorgehoben, wenn ein Layer ausgeblendet ist.


Aktualisieren
Ansicht / Aktualisieren

Verwenden Sie diesen Befehl, um den Bildschirm zu aktualisieren.

Wählen Sie diesen Befehl (oder betätigen Sie F5), um die Graphikansicht neu zu zeichnen, wenn das Graphikfenster mehrfach überschrieben wurde und dadurch schwierig zu lesen ist.


Optionen
Ansicht / Optionen

Verwenden Sie diesen Befehl, um die Anzeige von Höhenlinien und Dreiecken im Graphikfenster einzustellen.

Sie können:

  die Darstellung von Höhenlinien und Dreiecken anzeigen oder verbergen

  die großen und kleinen Höhenlinienintervalle ändern

  die Farben der Höhenlinien und Dreiecken bearbeiten

  die Linientypen der Höhenlinien und Dreiecken bearbeiten

  die Methode zur Höhenlinienzeichnung bearbeiten

Die Register im Dialogfeld Optionen zeigen die Einstellungen an, die Sie in der DTMLink™ Software ändern können.

Die Register sind:

Linienoptionen

Fortgeschritten


Linienoptionen

Verwenden Sie das Register Linienoptionen im Dialogfeld Optionen, um festzulegen, wie die Höhenlinien und Dreiecke im Graphikfenster dargestellt werden sollen.

Höhenlinien anzeigen

Verwenden Sie die Gruppe Höhenlinien anzeigen, um die Linienoptionen für Höhenlinien einzustellen. Wählen Sie das Kontrollkästchen Höhenlinien anzeigen, um die Höhenlinien im Graphikfenster anzuzeigen. Wenn Sie die Höhenlinien verbergen möchten, deaktivieren Sie die Kontrollmarkierung im Kontrollkästchen Höhenlinien anzeigen.

Intervall	Stellen Sie die großen und kleinen Höhenlinienintervalle ein.

TIP: Verwenden Sie verschiedene Farben, um die Großen und Kleinen Intervalle darzustellen. So können Sie Höhenänderungen schnell erkennen.

Die in diesem Feld angegebenen Einheiten sind die Einheiten, die in der Trimble Geomatics Office™ Software festgelegt sind.

Sie können ein kleines Intervall nicht auf einen Wert einstellen, der größer als das große Intervall ist. Das große Intervall muß ein Mehrfaches des kleinen Intervalls darstellen.

Pos. Farbe

Stellen Sie die Anzeigefarbe für Höhenlinien ein, die sich über Normalnull befinden. Wählen Sie eine Farbe aus der Liste.

Verwenden Sie verschiedene Farben, um die Großen und Kleinen Intervalle darzustellen. So können Sie Höhenänderungen schnell erkennen.

Neg. Farbe

Stellen Sie die Anzeigefarbe für Höhenlinien ein, die sich unter Normalnull befinden. Wählen Sie eine Farbe aus der Liste.

Verwenden Sie verschiedene Farben, um die Großen und Kleinen Intervalle darzustellen. So können Sie Höhenänderungen schnell erkennen.

Linientyp	Wählen Sie einen Linientyp aus der Liste.

Dreiecke anzeigen

Verwenden Sie die Gruppe Dreiecke anzeigen, um die Linienoptionen für Dreiecke einzustellen. Wählen Sie das Kontrollkästchen Dreiecke anzeigen, um die Dreiecke im Graphikfenster anzuzeigen. Wenn Sie die Dreiecke verbergen möchten, deaktivieren Sie die Kontrollmarkierung im Kontrollkästchen Dreiecke anzeigen.

Farbe	Dieses Feld stellt die Anzeigefarbe von Dreiecken ein. Wählen Sie eine Farbe aus der Liste. Diese Farbe stellt die Ränder der Dreiecke dar.

Linientyp	Wählen Sie einen Linientyp aus der Liste.

Anwenden

Klicken Sie auf Anwenden, um die Änderungen anzuwenden und das Dialogfeld Optionen geöffnet zu lassen.

OK

Klicken Sie auf OK, um die Änderungen anzuwenden und das Dialogfeld zu verlassen.


Fortgeschrittene Optionen

Verwenden Sie das Register Fortgeschrittene Optionen im Dialogfeld Optionen, um den Bereich der Höhenlinien und ihre Darstellung im Graphikfenster zu definieren.

Höhenlinien als Linien zeichnen

Wählen Sie die Option Höhenlinien als Linien zeichnen, um gerade Linien zwischen jedem Dreieck im Modell anzuzeigen.

Höhenlinien als Kurven zeichnen

Wählen Sie die Option Höhenlinien als Kurven zeichnen, um eine realistischere Höhenlinie zwischen jedem Dreieck im Modell anzuzeigen.

Verwenden Sie den Schieberegler Kurvenenge, um anzugeben, wie gerade die Kurve ist. Das heißt, die Einstellung des Schiebereglers auf maximale Kurvenenge ergibt eine gerade Linie. Mit der Voreinstellung des Schiebereglers werden im allgemeinen Kurven erzeugt, die vom Erscheinungsbild her angenehm sind.

TIP: Verwenden Sie den Schieberegler, um Kontrolle über ungewöhnliche Situationen zu haben, z. B. wenn eine Höhenlinie eine andere aufgrund einer Kurvenglättung kreuzt.

Alle Höhenlinien anzeigen

Wählen Sie die Option Alle Höhenlinien anzeigen, um alle Höhenlinien im Modell anzuzeigen.

Höhenlinien anzeigen zwischen

Wählen Sie die Option Höhenlinien anzeigen zwischen, um alle Höhenlinien innerhalb des angegebenen Höhenbereichs anzuzeigen.

Minimale Höhe	Geben Sie die minimale Höhe der anzuzeigenden Höhenlinien in das Feld Minimale Höhe ein. Der gemäß Voreinstellung angezeigte Wert ist der niedrigste im Modell aufgezeichnete Punkt.

TIP: Klicken Sie auf Höchste/r/s, um den maximalen Höhenwert auszuwählen.

Maximale Höhe	Geben Sie die maximale Höhe der anzuzeigenden Höhenlinien in das Feld Maximale Höhe ein. Der gemäß Voreinstellung angezeigte Wert ist der höchste im Modell aufgezeichnete Punkt.

TIP: Klicken Sie auf Tiefste/r/s, um den minimalen Höhenwert auszuwählen.

Anwenden

Klicken Sie auf Anwenden, um die Änderungen anzuwenden und das Dialogfeld Optionen geöffnet zu lassen.

OK

Klicken Sie auf OK, um die Änderungen anzuwenden und das Dialogfeld zu verlassen.


Eigenschaften
Ansicht / Eigenschaften

	Klicken Sie auf das Symbol Eigenschaften auf der Standard-Symbolleiste

Verwenden Sie das Eigenschaftsfenster, um die Eigenschaften jedes Elements anzusehen.

HINWEIS: Sie können die Elemente im Eigenschaftsfenster nicht bearbeiten. Um Elemente zu bearbeiten, kehren Sie zur Trimble Geomatics Office™ Software zurück, und verwenden Sie das Eigenschaftsfenster in der Trimble Geomatics Office Software zur Bearbeitung der Elemente. Erstellen Sie daraufhin unter Verwendung der bearbeiteten Elemente eine neue Oberfläche.

Das Eigenschaftsfenster zeigt die Bezeichnung und entsprechenden Werte des gewählten Elements an.

TIP: Um die Größe des Eigenschaftsfensters zu ändern, klicken Sie auf den Fensterrahmen, und ziehen Sie ihn. Um die Größe der Teilung innerhalb des Fensters zu ändern, klicken Sie auf den Fensterteiler, und ziehen Sie ihn.


Eigenschaftsfenster

Im Eigenschaftsfenster können Sie die Eigenschaften jedes Elementes ansehen. Sie können keine Bearbeitung durchführen. Das Fenster zeigt die entsprechende Bezeichnung und Werte des Elements an.

HINWEIS: Sie können nur jeweils ein Element zur gleichen Zeit wählen.


Menü "Ansicht"

Das Menü “Ansicht” bietet Befehle für die Steuerung und die Anzeige des Höhenlinienmodells in Graphikfenstern. Die folgenden Befehle sind verfügbar:

Vergrößern

Verkleinern

Verschieben

Verschieben zu

Zoom-Ausdehnung

Vorherige Ansicht

Zusatzfenster

Symbolleisten

Layer

Aktualisieren

Optionen

Eigenschaften


Neues Fenster
Fenster / Neues Fenster

Verwenden Sie diesen Befehl, um ein anderes Fenster für die aktuelle Oberfläche zu öffnen.

Verwenden Sie diesen Befehl, um ein neues Fenster mit demselben Inhalt wie das aktivierte Fenster zu öffnen. Sie können mehrere Fenster öffnen, um unterschiedliche Bestandteile oder Ansichten zur gleichen Zeit anzuzeigen. Wenn Sie den Inhalt in einem Fenster verändern, reflektieren alle übrigen Fenster diese Änderungen. Wenn Sie ein neues Fenster öffnen, wird es zum aktiven Fenster und wird im Vordergrund angezeigt.


Überlappend
Fenster / Überlappend

Verwenden Sie diesen Befehl, um die Größe der geöffneten Fenster und Dialogfelder auf dem Desktop zu verändern, und um sie in einem überlappenden Muster von links oben nach rechts unten anzuordnen.

Wenn Sie Fenster überlappend anordnen, werden sie stufenweise angeordnet, und Sie können die Titelleisten aller Fenster auf dem Desktop erkennen.


Nebeneinander
Fenster / Nebeneinander

Verwenden Sie diesen Befehl, um die geöffneten Fenster und Dialogfelder auf dem Desktop zu verschieben und deren Größe zu verändern, und um sie nebeneinander anzuordnen.


Symbole anordnen
Fenster / Symbole anordnen

Verwenden Sie diesen Befehl, um alle Symbole minimierter Fenster in einem übersichtlichen Muster neu auf dem Bildschirm anzuordnen. Dieser Befehl ordnet Symbole im unteren Bereich des Fensters an.


Fensterliste
Fenster / Fensterliste

Verwenden Sie den unteren Bereich dieses Menüs, um eine Liste von Fenstern anzuzeigen, die momentan auf dem Desktop geöffnet sind. Das aktivierte Fenster weist eine Kontrollmarkierung auf.

Klicken Sie auf den Namen eines bestimmten Fensters oder Dialogfelds, um es zu aktivieren.


Menü "Fenster"
Menü “Fenster”

Das Menü “Fenster” enthält Befehle für Ansichtsoptionen. Es verfügt über die folgenden Befehle:

Neues Fenster

Überlappend

Nebeneinander

Symbole anordnen

Bildschirm-Fensterliste


Sich überkreuzende Begrenzungen

Wenn sich überkreuzende Begrenzungen vorgefunden werden, erscheint die folgende Meldung:

Es wurden sich überkreuzende Begrenzungen entdeckt. Möchten Sie den Bericht ansehen?

Klicken Sie auf Ja, um den Bericht anzusehen.

Der Bericht überkreuzende Begrenzungen zeigt die zwei sich überkreuzenden Linien an. Er beschreibt die sich überkreuzenden Linien mit Hilfe eines Punktnamens, dem Start der Hochwert- und Rechtswert-Koordinatenlinie und dem Ende der Hochwert- und Rechtswert-Koordinatenlinie.

Ein Bericht über sich überkreuzende Begrenzungen sieht ähnlich wie das folgende Beispiel aus.

Bericht überkreuzende Begrenzungen

Projekt DTMLink Tutorial

Projektname	DTMLink Tutorial

Oberfläche	Oberfläche 1

Einheiten	Meter

Druckdatum	29/07/99  11:56am

Es wurden sich überkreuzende Begrenzungen entdeckt

                  Punkt   Hochwert     Rechtswert      Höhe

Linie von          187     4408.302     2482.427      119.708

      bis          179     4430.895     2442.447      119.694   kreuzt

Linie von          181     4443.678     2465.296      119.722

      bis          187     4408.302     2482.427      119.708

Der Bericht wird in Ihrem Bericht-Ordner C:\Trimble Geomatics Office\Projekte\xx\Reports\RoadLink - DTMLink\yy gespeichert, wobei xx die Projektbezeichnung und yy der Name der Oberfläche ist.

Sie können den Bericht später ansehen, indem Sie ihn mit Microsoft Windows Explorer in diesem Ordner öffnen.


Sich überkreuzende Bruchkanten

Wenn sich überkreuzende Bruchkanten vorgefunden werden, erscheint die folgende Meldung:

Es wurden sich überkreuzende Bruchkanten entdeckt. Möchten Sie den Bericht ansehen?

Klicken Sie auf Ja, um den Bericht anzusehen.

Der Bericht überkreuzende Bruchkanten zeigt die zwei sich überkreuzenden Linien an. Er beschreibt die sich überkreuzenden Linien mit Hilfe eines Punktnamens, dem Start der Hochwert- und Rechtswert-Koordinatenlinie und dem Ende der Hochwert- und Rechtswert-Koordinatenlinie.

Ein Bericht über sich überkreuzende Bruchkanten sieht ähnlich wie das folgende Beispiel aus.

Bericht überkreuzende Bruchkanten

Projekt DTMLink Tutorial

Projektname	DTMLink Tutorial

Oberfläche	Oberfläche 1

Einheiten	Meter

Druckdatum	28/07/99  3:23pm

Es wurden sich überkreuzende Bruchkanten entdeckt

                   Punkt    Hochwert     Rechtswert     Höhe

Linie von           38      4456.360     2461.687      110.358

      bis           187     4408.302     2482.427      119.708   kreuzt

Linie von           182     4447.684     2476.296      120.100

      bis           181     4443.678     2465.296      119.722

Linie von           190     4411.104     2461.389      118.697

       Bis          183     4442.452     2486.146      120.193   kreuzt

Linie von            38     4456.360     2461.687      110.358

       Bis          187     4408.302     2482.427      119.708

Der Bericht wird in Ihrem Bericht-Ordner C:\Trimble Geomatics Office\Projekte\xx\Reports\RoadLink - DTMLink \yy gespeichert, wobei xx die Projektbezeichnung und yy der Name der Oberfläche ist.

Sie können den Bericht später ansehen, indem Sie ihn mit Microsoft Windows Explorer in diesem Ordner öffnen.


Ausgeglichene Koordinaten

Wenn eine Bruchkante sehr nahe an einem Oberflächenpunkt vorbei verläuft, wird die Höhe dieses nächstgelegenen Punktes auf einen interpolierten Höhenwert von der Bruchkante umgeändert. Dies geschieht, um zu vermeiden, daß ungewöhnliche Höhenlinien von dem nächstgelegenen Punkt zu der Bruchkante gedrängt werden.

Falls Sie diesen Punkt nicht ausgeglichen haben möchten, können Sie den Hochwert und Rechtswert so ändern, daß sich der Punkt gleich neben der Bruchkante befindet.

Nachdem das DTMLink-System die Koordinaten ausgleicht, erscheint die folgende Meldung:

Koordinatenpunkt ausgeglichen, möchten Sie den Bericht sehen?

Klicken Sie auf Ja, um den Bericht anzusehen.

Der Bericht über ausgeglichene Koordinaten zeigt die Koordinatendetails des ausgeglichenen Punktes und die überarbeiteten Koordinatendetails.

Ein Bericht über ausgeglichene Koordinaten sieht ähnlich wie das folgende Beispiel aus:

Bericht über ausgeglichene Koordinaten

Projekt DTMLink Tutorial

Projektname	DTMLink Tutorial

Oberfläche	Oberfläche 1

Einheiten	Meter

Druckdatum	28/07/99  2:37pm

Koordinaten ausgeglichen

Koordinatenpunkt ausgeglichen

Höhe ist auf interpolierte Bruchkantenhöhe eingestellt

                              Punkt    Hochwert       Rechtswert     Höhe

Koordinatendetails:           2453     4573.147        5734.531     23.000

Überarbeitete Koord.details:  2453     4573.147        5734.531     53.798

Der Bericht wird in Ihrem Bericht-Ordner C:\Trimble Geomatics Office\Projekte\xx\Reports\RoadLink - DTMLink \yy gespeichert, wobei xx die Projektbezeichnung und yy der Name der Oberfläche ist.

Sie können den Bericht später ansehen, indem Sie ihn mit Microsoft Windows Explorer in diesem Ordner öffnen.


Doppelter Punkt

Während der Erzeugung des Höhenlinienmodells werden alle Punkte auf doppelte Hochwert- und Rechtswert-Koordinaten überprüft. Wenn doppelte Punkte vorgefunden werden, behält die DTMLink™ Software den zuletzt erfaßten Punkt bei und verwirft die anderen Punkte.

in Beispiel eines Doppelten Punktberichts folgt:

Bericht über doppelte Punkte

Projekt DTMLink Tutorial

Projektname	DTMLink Tutorial

Oberfläche	Oberfläche 1

Einheiten	Meter

Druckdatum	28/07/99  4:02pm

Doppelte Punkte gelesen

                       Punkt      Hochwert      Rechtswert      Höhe

Punkt beibehalten:     55138      4452.923       2487.237      55.912

Punkt verworfen:         138      4452.923       2487.237     116.912

Punkt beibehalten:      1877      4408.302       2482.427      19.708

Punkt verworfen:         187      4408.302       2482.427     119.708

Der Bericht wird in Ihrem Bericht-Ordner C:\Trimble Geomatics Office\Projekte\xx\Reports\RoadLink - DTMLink\yy gespeichert, wobei xx die Projektbezeichnung und yy der Name der Oberfläche ist.

Sie können den Bericht später ansehen, indem Sie ihn mit Microsoft Windows Explorer in diesem Ordner öffnen.

HINWEIS: Die DTMLink Software unterstützt keine vertikalen Lagen.


Kurventoleranz

Kurven und Bogen können Begrenzungen und Bruchkanten definieren.

Um Dreiecksberechnungen mit Bruchkanten und Begrenzungen, die Kurven und Bogen sind, zuzulassen, wird die Kurve oder der Bogen als eine Reihe kleiner Liniensegmente dargestellt.

Der Länge des Liniensegmentes wird von einer Kurventoleranz gesteuert. Eine Kurventoleranz ist die maximal zulässige Strecke von einem beliebigen Punkt entlang der Liniensegmentreihe zu der Kurve oder dem Bogen, und zwar senkrecht zu dem Liniensegment.

Die Kurventoleranz ist auf 0,02 Meter eingestellt.


Fehlermeldungen

Ausgeglichene Koordinaten

Sich überkreuzende Bruchkanten

Sich überkreuzende Begrenzungen

Doppelter Punkt

Ungültige Punktnamen

Koordinate bezieht sich nicht auf einen Punkt


Ungültiger Punktname

Wenn ein ungültiger Punktname in ein Dialogfeld eingegeben wird, erscheint die Fehlermeldung:

X ist kein gültiger Punktname

Wobei X der Punktname ist.

Sie müssen einen Punktnamen eingeben, der als Teil des Höhenlinienmodells definiert wurde. Wenn Sie einen Punkt benötigen, der anfänglich nicht definiert wurde:

1.	Kehren Sie zum Trimble Geomatics Office Bildschirm zurück.

2.	Wählen Sie den Menübefehl Hilfsmittel / DTMLink / Bestehende Oberfläche.

Das Dialogfeld Bestehende Oberfläche erscheint.

3.	Fügen Sie der Oberfläche neue Punkte hinzu.

Weitere Informationen finden Sie in der Online-Hilfe der Trimble Geomatics Office™ Software.


Koordinate bezieht sich nicht auf einen Punkt

Wenn Koordinaten, die nicht mit den Koordinaten eines aktuellen Oberflächenpunktes übereinstimmen, in ein Dialogfeld eingegeben werden, erscheint die Fehlermeldung:

Koordinate bezieht sich nicht auf einen Punkt.

Sie müssen Koordinaten eines bestehenden Punktes in die Felder Hochwert und Rechtswert eingeben.

Wenn Sie die von Ihnen eingegebenen Koordinaten benötigen:

1.	Kehren Sie zum Trimble Geomatics Office Bildschirm zurück.

2.	Fügen Sie einen neuen Punkt mit den von Ihnen benötigten Koordinaten hinzu, wenn diese nicht existieren.

3.	Wählen Sie den Menübefehl Hilfsmittel / DTMLink / Bestehende Oberfläche.

Das Dialogfeld Bestehende Oberfläche erscheint.

4.	Fügen Sie der Oberfläche neue Punkte hinzu.

Weitere Informationen zum Dialogfeld Bestehende Oberfläche finden Sie in der Online-Hilfe der Trimble Geomatics Office™ Software.


Einen Punkt einschließen

Verwenden Sie entweder das Symbol Punkt einschließen [image] auf der Oberflächen-Symbolleiste oder den Befehl Entwurf / Punkt einschließen, um einen Punkt in das Höhenlinienmodell einzuschließen.

Entwurf / Punkt einschließen

Verwenden Sie diesen Befehl, um das Dialogfeld Punkt einschließen zu öffnen. Das Dialogfeld Punkt einschließen ist nur über den Menübefehl verfügbar.

Der Cursor nimmt die Form [image] an, wenn das Dialogfeld Punkt einschließen aktiv ist.

Verwenden Sie die Felder im Dialogfeld Punkt einschließen, um den in die Oberfläche einzuschließenden Punkt zu wählen.

Einzuschließender Punkt

Verwenden Sie die Gruppe Einzuschließender Punkt, um den Punktnamen oder die Hochwert- und Rechtswert-Koordinaten des in die Oberfläche einzuschließenden Punktes einzugeben.

Punktname

Verwenden Sie das Feld Punktname, um den einzuschließenden Punkt zu identifizieren. Wenn dies ein gültiger Oberflächenpunktname ist, werden die Felder Hochwert und Rechtswert automatisch ausgefüllt.

HINWEIS: Wenn Sie einen ungültigen Oberflächenpunktnamen eingeben, erscheint eine Fehlermeldung:

X ist kein gültiger Punktname

wobei X der Punktname ist.

Hochwert / Rechtswert

Verwenden Sie diese Felder, um die Koordinaten des Oberflächenpunktes einzugeben, wenn Sie den Punktnamen nicht kennen.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten für den Punkt in die Gruppe Einzuschließender Punkt einzugeben.

HINWEIS: Wenn Sie Koordinaten eingeben, die nicht mit den Koordinaten eines gültigen Oberflächenpunktes übereinstimmen, erscheint eine Fehlermeldung:

Koordinate bezieht sich nicht auf einen Punkt

Anwenden

Klicken Sie auf Anwenden, um die Oberfläche zu aktualisieren, und setzen Sie das Dialogfeld zurück, wenn Sie einen weiteren einzuschließenden Punkt eingeben möchten.

Wenn Sie lediglich einen Punkt einschließen möchten, klicken Sie auf OK, um die Oberfläche automatisch zu aktualisieren, und schließen Sie das Dialogfeld.

Symbol Punkt einschließen

Klicken Sie auf das Symbol Punkt einschließen [image] auf der Oberflächen-Symbolleiste, um einen Punkt einzuschließen, der nicht Bestandteil der Oberfläche ist.

Der Cursor nimmt die Form [image] an, wenn der Vorgang Punkt einschließen aktiviert ist.

Wählen Sie den einzuschließenden Punkt im Graphikfenster.

Der Vorgang Punkt einschließen aktualisiert die Oberfläche automatisch.

WARNUNG: Wenn ein Dreieck zuvor zwischen den Punkten, die Sie jetzt einschließen, gelöscht wurde, wird das Dreieck erneut gebildet.

TIP: Verwenden Sie Bearbeiten / Rückgängig, um den Vorgang Punkt einschließen rückgängig zu machen.


Einen Punkt ausschließen

Verwenden Sie entweder das Symbol Punkt ausschließen [image] auf der Oberflächen-Symbolleiste oder den Befehl Entwurf / Punkt ausschließen, um einen Punkt aus dem Höhenlinienmodell auszuschließen.

Entwurf / Punkt ausschließen

Verwenden Sie diesen Befehl, um das Dialogfeld Punkt ausschließen zu öffnen. Das Dialogfeld Punkt ausschließen ist nur über den Menübefehl verfügbar.

Der Cursor nimmt die Form [image] an, wenn das Dialogfeld Punkt ausschließen aktiviert ist.

Verwenden Sie die Felder im Dialogfeld Punkt ausschließen, um den aus der Oberfläche auszuschließenden Punkt zu wählen.

Auszuschließender Punkt

Verwenden Sie die Gruppe Auszuschließender Punkt, um den Punktnamen oder die Hochwert- und Rechtswert-Koordinaten des aus der Oberfläche auszuschließenden Punktes einzugeben.

Punktname

Verwenden Sie das Feld Punktname, um den auszuschließenden Punkt zu identifizieren. Wenn dies ein gültiger Oberflächenpunktname ist, werden die Felder Hochwert und Rechtswert automatisch ausgefüllt.

HINWEIS: Wenn Sie einen ungültigen Oberflächenpunktnamen eingeben, erscheint eine Fehlermeldung:

X ist kein gültiger Punktname

Wobei X der Punktname ist.

Hochwert / Rechtswert

Verwenden Sie diese Felder, um die Koordinaten des Oberflächenpunktes einzugeben, wenn Sie den Punktnamen nicht kennen.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten für den Punkt in die Gruppe Auszuschließender Punkt einzugeben.

HINWEIS: Wenn Sie Koordinaten eingeben, die nicht mit den Koordinaten eines gültigen Oberflächenpunktes übereinstimmen, erscheint eine Fehlermeldung:

Koordinate bezieht sich nicht auf einen Punkt

Anwenden

Klicken Sie auf Anwenden, um die Oberfläche zu aktualisieren, und setzen Sie das Dialogfeld zurück, wenn Sie einen weiteren auszuschließenden Punkt eingeben möchten.

Wenn Sie lediglich einen Punkt ausschließen möchten, klicken Sie auf OK, um die Oberfläche automatisch zu aktualisieren, und schließen Sie das Dialogfeld.

Symbol Punkt ausschließen

Klicken Sie auf das Symbol Punkt ausschließen [image] auf der Oberflächen-Symbolleiste, wenn ein bestimmter Punkt nicht im Höhenlinienmodell verwendet werden soll.

Der Cursor nimmt die Form [image] an, wenn der Vorgang Punkt ausschließen aktiviert ist.

Wählen Sie den auszuschließenden Punkt im Graphikfenster.

Bei dieser Option müssen Sie die Oberfläche nicht aktualisieren. Der Vorgang Punkt ausschließen aktualisiert die Oberfläche automatisch.

HINWEIS: Es erscheint eine Fehlermeldung, wenn Sie einen Punkt wählen, der nicht Bestandteil der Oberfläche ist.

TIP: Verwenden Sie Bearbeiten / Rückgängig, um den Vorgang Punkt ausschließen rückgängig zu machen.

Die Verwendung des Befehls Punkt ausschließen ist z. B. dann von Vorteil, wenn ein ungenauer Punkt unregelmäßige Höhenlinien verursacht. Sie können diesen Befehl dann verwenden, um den Punkt zu ignorieren.


Dreiecke auswechseln

Verwenden Sie entweder das Symbol Dreiecke auswechseln [image] auf der Oberflächen-Symbolleiste oder den Befehl Entwurf / Dreiecke auswechseln, um zwei Dreiecke im Höhenlinienmodell auszuwechseln.

Entwurf / Dreiecke auswechseln

Verwenden Sie diesen Befehl, um das Dialogfeld Dreiecke auswechseln zu öffnen. Das Dialogfeld Dreiecke auswechseln ist nur über den Menübefehl verfügbar.

Der Cursor nimmt die Form [image] an, wenn das Dialogfeld Dreiecke auswechseln aktiviert ist.

Verwenden Sie die Felder im Dialogfeld Dreiecke auswechseln, um die in der Oberfläche auszuwechselnden Dreiecke zu wählen.

Erstes Dreieck

Verwenden Sie die Gruppe Erstes Dreieck, um das erste auszuwechselnde Dreieck zu identifizieren.

Hochwert / Rechtswert

Geben Sie beliebige Koordinaten innerhalb des Dreiecks ein, um das erste auszuwechselnde Dreieck zu identifizieren.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten einzugeben.

Zweites Dreieck

Verwenden Sie die Gruppe Zweites Dreieck, um das zweite auszuwechselnde Dreieck zu identifizieren.

Rechtswert / Hochwert

Geben Sie beliebige Koordinaten innerhalb des Dreiecks ein, um das zweite auszuwechselnde Dreieck zu identifizieren.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten einzugeben.

Anwenden

Klicken Sie auf Anwenden, um die Dreiecke auszuwechseln, die konvexe Vierecke bilden.

Klicken Sie auf OK, um die Dreiecke auszuwechseln, und schließen Sie das Dialogfeld.

TIP: Verwenden Sie Bearbeiten / Rückgängig, um den Vorgang Dreiecke auswechseln rückgängig zu machen.

Symbol Dreiecke auswechseln

Klicken Sie auf das Symbol Dreiecke auswechseln [image] auf der Oberflächen-Symbolleiste, um das Höhenlinienmodell durch Auswechseln von Dreiecken zu ändern.

Der Cursor nimmt die Form [image] an, wenn der Vorgang Dreiecke auswechseln aktiviert ist.

Wählen Sie das erste auszuwechselnde Dreieck. Dieses Dreieck erscheint auf dem Bildschirm in grün.

Wählen Sie das zweite Dreieck. Wenn die beiden gewählten Dreiecke ein Viereck bilden, werden die Ecken, von denen die Diagonalen ausgehen, ausgewechselt und zwei neue Dreiecke gebildet. Siehe dazu die nachfolgende Abb. 1.

Dreiecke auswechseln

Zwei miteinander verbundene Dreiecke bilden ein Viereck, siehe Abb. 1.

Abb. 1  Dreiecke

Das Symbol Dreiecke auswechseln oder der Befehl Entwurf / Dreiecke auswechseln funktioniert nur mit konvexen Vierecken. Wenn Sie ein konkaves Viereck wählen, erscheint eine Fehlermeldung.

Wenn Sie Dreiecke auswechseln, wird die Höhenneigung zwischen Punkten entlang den Seiten der neuen Dreiecke neu gebildet. Die erzeugte Höhenlinie kann leicht unterschiedlich sein und realistischer dargestellt werden.

Manchmal verbessert das Auswechseln von Dreiecken das Höhenlinienmodell nicht. Dies kommt z. B. vor, wenn das Höhenlinienmodell unregelmäßig ist.


Ein Dreieck löschen

Verwenden Sie entweder das Symbol Dreieck löschen [image] auf der Oberflächen-Symbolleiste oder den Befehl Entwurf / Dreieck löschen, um ein Dreieck im Höhenlinienmodell zu löschen.

Entwurf / Dreiecke löschen

Verwenden Sie diesen Befehl, um das Dialogfeld Dreieck löschen zu öffnen. Das Dialogfeld Dreieck löschen ist nur über den Menübefehl verfügbar.

Der Cursor nimmt die Form [image] an, wenn das Dialogfeld Dreieck löschen aktiviert ist.

Verwenden Sie die Felder im Dialogfeld Dreieck löschen, um die zu löschenden Dreiecke zu wählen.

Zu löschendes Dreieck

Verwenden Sie die Gruppe Zu löschendes Dreieck, um das zu löschende Dreieck zu identifizieren.

Hochwert / Rechtswert

Geben Sie beliebige Koordinaten innerhalb des Dreiecks ein, um das zu löschende Dreieck zu identifizieren.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten einzugeben.

Anwenden

Klicken Sie auf Anwenden, um die Oberfläche zu aktualisieren, und setzen Sie das Dialogfeld zurück, wenn Sie ein weiteres auszuschließendes Dreieck eingeben möchten.

Wenn Sie lediglich ein Dreieck ausschließen möchten, klicken Sie auf OK, um die Oberfläche automatisch zu aktualisieren, und schließen Sie das Dialogfeld.

TIP: Verwenden Sie Bearbeiten / Rückgängig, um gelöschte Dreiecke wiederherzustellen.

Symbol Dreieck löschen

Klicken Sie auf das Symbol Dreieck löschen [image] auf der Oberflächen-Symbolleiste, um das Höhenlinienmodell durch Entfernen von Dreiecken zu ändern.

Der Cursor nimmt die Form [image] an, wenn der Vorgang Dreieck löschen aktiviert ist.

Wählen Sie das zu löschende Dreieck im Graphik-Bildschirm.

Dreiecke, die entfernt werden

Alle Dreiecke, die entfernt werden, sind nicht im Digitalen Geländemodell (DGM) enthalten. Dies ist dann von Nutzen, wenn Sie eine schnelle und wirksame Methode benötigen, um den externen Rand des Höhenlinienmodells übersichtlicher zu gestalten, speziell dort, wo sich Höhenlinien zu langen und unrealistisch geformten Dreiecken gebildet haben.

WARNUNG: Gelöschte Dreiecke werden nach einer Oberflächenaktualisierung nicht erneut gebildet, es sei denn, es wurde eine Begrenzung zu dem Modell hinzugefügt oder eine Begrenzung im Modell bearbeitet.

TIP: Wenn das Modell nach dem Löschen von Dreiecken neu aufgebaut wird, und Begrenzungslinien bearbeitet wurden, werden die gelöschten Dreiecke erneut als Teil des Modells gebildet. Wenn gelöschte Dreiecke im Anschluß an eine Modellaktualisierung aufrechterhalten werden sollen, plazieren Sie vor der Aktualisierung Begrenzungen um die jeweiligen Punkte.


Linie hinzufügen

Verwenden Sie entweder das Symbol Linie hinzufügen auf der Oberflächen-Symbolleiste oder den Befehl Entwurf / Linie hinzufügen, um eine Bruchkante oder Begrenzung zu dem Höhenlinienmodell hinzuzufügen.

Entwurf / Linie hinzufügen

Verwenden Sie diesen Befehl, um das Dialogfeld Linie hinzufügen zu öffnen. Das Dialogfeld Linie hinzufügen ist nur über den Menübefehl verfügbar.

Verwenden Sie die Felder im Dialogfeld Linie hinzufügen, um eine Bruchkante oder Begrenzung zu dem Höhenlinienmodell hinzuzufügen.

Linientyp

Verwenden Sie die Gruppe Linientyp, um den gewünschten Linientyp anzugeben.

Die Tabelle listet die Optionen auf:

Um folgendes hinzuzufügen…	wählen Sie…
eine Bruchkante	das Kontrollkästchen Bruchkante-Linientyp
eine Begrenzung	das Kontrollkästchen Begrenzung-Linientyp. Sie können den Begrenzungstyp festlegen, indem Sie entweder die Option Einschließen oder Ausschließen wählen.
einen Bruchkanten-Linientyp sowie einen Begrenzungs-Linientyp	beide Kontrollkästchen, und legen Sie den Begrenzungstyp fest, indem Sie entweder die Option Einschließen oder Ausschließen wählen. Das bedeutet, daß Sie einen Bruchkanten-Linientyp mit ausschließender Begrenzung oder einen Bruchkanten-Linientyp mit einschließender Begrenzung wählen können.
Linienanfang

Verwenden Sie die Gruppe Linienanfang, um den Punktnamen oder die Hochwert- und Rechtswert-Koordinaten für den Linienanfang einzugeben.

Punktname

Verwenden Sie das Feld Punktname, um den Startpunkt für die Linie zu identifizieren. Wenn dies ein gültiger Oberflächenpunktname ist, werden die Felder Hochwert und Rechtswert automatisch ausgefüllt.

HINWEIS: Wenn Sie einen ungültigen Oberflächenpunktnamen eingeben, erscheint eine Fehlermeldung:

X ist kein gültiger Punktname

Wobei X der Punktname ist.

Hochwert / Rechtswert

Verwenden Sie diese Felder, um die Koordinaten des Startpunktes einzugeben, wenn Sie den Punktnamen nicht kennen.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten für den Linienanfang einzugeben.

Linienende

Verwenden Sie die Gruppe Linienende, um den Punktnamen oder die Hochwert- und Rechtswert-Koordinaten für das Linienende einzugeben.

Punktname

Verwenden Sie das Feld Punktname, um den Endpunkt für die Linie zu identifizieren. Wenn dies ein gültiger Oberflächenpunktname ist, werden die Felder Hochwert und Rechtswert automatisch ausgefüllt.

HINWEIS: Wenn Sie einen ungültigen Oberflächenpunktnamen eingeben, erscheint eine Fehlermeldung:

X ist kein gültiger Punktname.

Wobei X der Punktname ist.

Hochwert / Rechtswert

Verwenden Sie diese Felder, um die Koordinaten des Oberflächenpunktes einzugeben, wenn Sie den Punktnamen nicht kennen.

TIP: Verwenden Sie die graphische Auswahl, um die Hochwert- und Rechtswert-Koordinaten für das Linienende einzugeben.

HINWEIS: Wenn Sie Koordinaten eingeben, die nicht mit den Koordinaten eines gültigen Oberflächenpunktes übereinstimmen, wird der Vorgang Linie hinzufügen nicht aktiviert.

Hinzufügen

Klicken Sie auf Hinzufügen, um die Linie zur Oberfläche hinzuzufügen. Der Endpunkt wird zum Startpunkt für die nächste Linie. Fügen Sie einen weiteren Endpunkt hinzu, um mit der Linie fortzufahren.

TIP: Wenn Sie die graphische Auswahl verwenden, um den Punkt zu identifizieren, doppelklicken Sie auf den Endpunkt, dann wird die Linie automatisch hinzugefügt.

WARNUNG: Das Klicken auf Hinzufügen aktualisiert die Oberfläche nicht. Klicken Sie auf Oberfl. aktual., um die Linien auf das Höhenlinienmodell anzuwenden.

Oberfläche aktualisieren

Nach dem Hinzufügen von Linien verändert sich die Aktualisierungsanzeige auf der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

Um die Oberfläche vor dem Schließen des Dialogfeldes Linie hinzufügen zu aktualisieren, klicken Sie auf Oberfl. aktual.

Um die Oberfläche nach dem Schließen des Dialogfeldes Linie hinzufügen zu aktualisieren, betätigen Sie F4, oder verwenden Sie den Befehl Entwurf / Oberfl. aktual.

Schrumpfhülle

Klicken Sie auf Schrumpfhülle, um eine einschließende Begrenzung zu erzeugen, die alle Punkte einschließt, die für das Höhenlinienmodell gewählt wurden. Diese einschließende Begrenzung enthält in der Regel nicht die gesamte detaillierte Begrenzungsdefinition, die Sie benötigen, aber sie bietet eine anfängliche Definition für eine einschließende Begrenzung. Verwenden Sie die Symbole Linie hinzufügen und Linie löschen, um diese anfängliche Definition zu bearbeiten und die benötigte Begrenzungsdefinition zu erstellen.

TIP: Verwenden Sie Bearbeiten / Rückgängig, um den Vorgang Linie hinzufügen rückgängig zu machen.

Symbol Linie hinzufügen

Mit dem Symbol Linie hinzufügen auf der Oberflächen-Symbolleiste können Sie folgendes hinzufügen:

  Eine Bruchkante

  Eine ausschließende Begrenzung

  Eine einschließende Begrenzung

  Eine einschließende Begrenzung mit einer Bruchkante

  Eine ausschließende Begrenzung mit einer Bruchkante


Eine Linie löschen

Verwenden Sie entweder das Symbol Bruchkante / Begrenzung löschen [image] auf der Oberflächen-Symbolleiste oder den Befehl Entwurf / Linie löschen, um eine Linie im Höhenlinienmodell zu löschen.

Entwurf / Linie löschen

Verwenden Sie diesen Befehl, um das Dialogfeld Linie löschen zu öffnen. Das Dialogfeld Linie löschen ist nur über den Menübefehl verfügbar.

Zu löschende Linientypen

Wählen Sie die zu löschenden Linientypen von der Liste.

Die verfügbaren Typen sind:

Linientypen	Diese Option bewirkt, daß …
Alle	alle Linien, die Sie auf der Oberfläche wählen und bei denen es sich um Bruchkanten oder Begrenzungen handelt, gelöscht werden. In einigen Fällen kann eine Linie eine Begrenzung und eine Bruchkante sein. Diese Option ist die Voreinstellung.
Bruchkanten	nur gewählte Bruchkanten gelöscht werden
Begrenzungen einschließen	nur gewählte einschließende Begrenzungen gelöscht werden
Begrenzungen ausschließen	nur gewählte ausschließende Begrenzungen gelöscht werden
Begrenzungen und Bruchkanten einschließen	nur gewählte einschließende Begrenzungen und Bruchkanten gelöscht werden
Begrenzungen und Bruchkanten ausschließen	nur gewählte ausschließende Begrenzungen und Bruchkanten gelöscht werden.

Linienanfang

Verwenden Sie die Gruppe Linienanfang, um den Punktnamen oder die Hochwert- und Rechtswert-Koordinaten für den Linienanfang einzugeben.

Punktname

Verwenden Sie das Feld Punktname, um den Startpunkt für die Linie zu identifizieren. Wenn dies ein gültiger Oberflächenpunktname ist, werden die Felder Hochwert und Rechtswert automatisch ausgefüllt.

HINWEIS: Wenn Sie einen ungültigen Oberflächenpunktnamen eingeben, erscheint eine Fehlermeldung:

 X ist kein gültiger Punktname.

Wobei X der Punktname ist.

Hochwert / Rechtswert

Verwenden Sie diese Felder, um die Koordinaten des Startpunktes einzugeben, wenn Sie den Punktnamen nicht kennen. Diese Felder sind schreibgeschützt, so daß Sie keine Koordinaten über die Tastatur eingeben können.

Linienende

Verwenden Sie die Gruppe Linienende, um den Punktnamen oder die Hochwert- und Rechtswert-Koordinaten für das Linienende einzugeben.

Punktname

Verwenden Sie das Feld Punktname, um den Endpunkt für die Linie zu identifizieren. Wenn dies ein gültiger Oberflächenpunktname ist, werden die Felder Hochwert und Rechtswert automatisch ausgefüllt.

HINWEIS: Wenn Sie einen ungültigen Oberflächenpunktnamen eingeben, erscheint eine Fehlermeldung:

X ist kein gültiger Punktname.

Wobei X der Punktname ist.

Hochwert / Rechtswert

Verwenden Sie diese Felder, um die Koordinaten des Endpunktes einzugeben, wenn Sie den Punktnamen nicht kennen. Diese Felder sind schreibgeschützt, so daß Sie keine Koordinaten über die Tastatur eingeben können.

TIP: Wählen Sie die Linie im Graphikfenster, wenn das Dialogfeld Linie löschen aktiviert ist, dann werden die Felder Startpunkt und Endpunkt automatisch ausgefüllt.

Anwenden

Klicken Sie auf Anwenden, um die Linie zu löschen.

Nach dem Auswählen der zu löschenden Linie verändert sich die Aktualisierungsanzeige auf der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

Um die Oberfläche vor dem Schließen des Dialogfelds Linie löschen zu aktualisieren, klicken Sie auf Oberfl. aktual.

Um die Oberfläche nach dem Schließen des Dialogfelds Linie löschen zu aktualisieren, betätigen Sie F4, oder verwenden Sie den Befehl Entwurf / Oberfl. aktual.

Klicken Sie auf Schließen, um das Dialogfeld zu schließen.

TIP: Verwenden Sie Bearbeiten / Rückgängig, um den Vorgang Linie löschen rückgängig zu machen.

Symbol Bruchkante / Begrenzung löschen

So löschen Sie eine Bruchkante oder Begrenzung unter Verwendung des Symbols Linie löschen:

1.	Klicken Sie auf das Symbol Bruchkante / Begrenzung löschen [image] auf der Oberflächen-Symbolleiste.

2.	Klicken Sie auf den Pfeil rechts neben dem Symbol, um auf die Liste der Linientypen zuzugreifen.

3.	Wählen Sie den Linientyp, den Sie löschen möchten.

Die Option, die Sie aus der Liste wählen, agiert als Filter. Wenn Sie auf eine Linie im Graphikfenster klicken, wird die Linie gelöscht, wenn es sich um eine Linie des angegebenen Linientyps handelt. Dies ist von Nutzen, wenn es mehr als eine Linie zwischen Punkten gibt, und Sie nur Linien eines bestimmten Typs löschen möchten.

WARNUNG: Der von Ihnen gewählte Linientyp verbleibt als Voreinstellung, bis Sie einen anderen Linientyp wählen oder die DTMLink™ Software schließen.

Der Cursor nimmt die Form [image] an, wenn der Vorgang aktiviert ist.

4.	Wählen Sie die zu löschende Begrenzung oder Bruchkante.

Nach dem Löschen von Linien verändert sich die Aktualisierungsanzeige in der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

5.	Um die Oberfläche zu aktualisieren, betätigen Sie F4, oder verwenden Sie den Befehl Entwurf / Oberfl. aktual.

6.	Deaktivieren Sie das Symbol, indem Sie ein anderes Symbol wählen, oder betätigen Sie F2.

HINWEIS: Sie können den Linientyp Begrenzungen einschließen z. B. in folgender Situation verwenden:

Wenn ein Gebäude auf der Begrenzung einer Oberfläche liegt, und Sie die einschließende Begrenzung ohne Auswirkung auf die ausschließende Begrenzung bearbeiten möchten. Wählen Sie den Linientyp Begrenzungen einschließen aus der Liste, und löschen Sie die entsprechenden Begrenzungslinien im Graphikfenster.


Eine Oberfläche aktualisieren

Nach dem Hinzufügen von Linien verändert sich die Aktualisierungsanzeige auf der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

Wählen Sie den Befehl Entwurf / Oberfl. aktual., oder betätigen Sie F4, um die Oberfläche zu aktualisieren und die Bruchkanten und Begrenzungen anzuwenden, die hinzugefügt wurden.

Die Oberfläche wird auch durch Klicken auf Oberfl. aktual. im Dialogfeld Linie hinzufügen aktualisiert.


Hinzufügen einer einschließenden Begrenzung unter Verwendung des Symbols Begrenzung einschließen

1.	Wählen Sie das Symbol Begrenzung einschließen [image] auf der Oberflächen-Symbolleiste.

Der Cursor nimmt die Form [image] an, wenn der Vorgang aktiviert ist.

2.	Klicken Sie auf den Oberflächenpunkt, an dem die Begrenzung beginnt.

3.	Fahren Sie fort, Teile der einschließenden Begrenzung hinzuzufügen, indem Sie Oberflächenpunkte wählen.

Auf dem Bildschirm erscheint eine dunkelblaue Linie zwischen den Punkten der einschließenden Begrenzung.

4.	Kehren Sie zum ersten Punkt zurück, um die Begrenzung zu schließen. Falls Sie die Begrenzung nicht geschlossen haben, versucht die DTMLink™ Software, die Begrenzung zu schließen, wenn Sie die Oberfläche aktualisieren.

Nach dem Hinzufügen von Linien verändert sich die Aktualisierungsanzeige auf der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

5.	Um die Oberfläche zu aktualisieren, führen Sie einen der folgenden Vorgänge durch:

  Betätigen Sie F4.

  Verwenden Sie den Befehl Entwurf / Oberfl. aktual.

6.	Um das Hinzufügen zu einer Begrenzung zu beenden, wählen Sie ein anderes Symbol, oder betätigen Sie F2.

HINWEIS: Um eine einschließende Begrenzung und eine Bruchkante unter Verwendung des Symbols Linie hinzufügen hinzuzufügen, drücken Sie den Pfeil rechts neben dem Symbol Begrenzung ausschließen, und wählen Sie Begrenzung und Bruchkante einschließen aus der Dropdown-Liste.


Hinzufügen einer ausschließenden Begrenzung unter Verwendung des Symbols Begrenzung ausschließen

So fügen Sie eine ausschließende Begrenzung unter Verwendung des Symbols Begrenzung ausschließen hinzu:

1.	Wählen Sie das Symbol Begrenzung ausschließen [image] auf der Oberflächen-Symbolleiste.

2.	Klicken Sie auf den Oberflächenpunkt, an dem die Begrenzung beginnt.

Der Cursor nimmt die Form [image] an, wenn der Vorgang aktiviert ist.

3.	Fahren Sie fort, Teile der ausschließenden Begrenzung hinzuzufügen, indem Sie Oberflächenpunkte wählen.

Auf dem Bildschirm erscheint eine hellblaue Linie zwischen den Punkten der ausschließenden Begrenzung.

4.	Kehren Sie zum ersten Punkt zurück, um die Begrenzung zu schließen. Falls Sie die Begrenzung nicht geschlossen haben, versucht die DTMLink™ Software, die Begrenzung zu schließen, wenn Sie die Oberfläche aktualisieren.

Nach dem Hinzufügen von Linien verändert sich die Aktualisierungsanzeige auf der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

5.	Um die Oberfläche zu aktualisieren, führen Sie einen der folgenden Vorgänge durch:

  Betätigen Sie F4.

  Verwenden Sie den Befehl Entwurf / Oberfl. aktual.

6.	Um das Hinzufügen zu einer Begrenzung zu beenden, wählen Sie ein anderes Symbol.

HINWEIS: Um eine ausschließende Begrenzung und eine Bruchkante unter Verwendung des Symbols Linie hinzufügen hinzuzufügen, drücken Sie den Pfeil rechts neben dem Symbol Begrenzung ausschließen, und wählen Sie Begrenzung und Bruchkante ausschließen aus der Dropdown-Liste.


Begrenzungen und Bruchkanten : Technische Details

Dieses Thema behandelt, wie ein Digitales Geländemodell (DGM) erzeugt wird, und erläutert einige Auswirkungen der Verarbeitung von Begrenzungen und Bruchkanten auf das Modell.

Wenn die Oberfläche erzeugt wird, bildet die DTMLink™ Software zwischen den Oberflächenpunkten Dreiecke. Die Linien (die die Dreiecksränder darstellen), die zwischen Oberflächenpunkten gebildet wurden, haben ein konstantes Gefälle.

Die folgenden Themen werden behandelt:

  Begrenzungen

  Bruchkanten

  Verarbeitungsauswirkung von Bruchkanten und Begrenzungen

Überblick Begrenzungen

Es gibt zwei Begrenzungstypen: einschließende Begrenzungen und ausschließende Begrenzungen. Eine einschließende Begrenzung ist eine Linie, die eine in das Höhenlinienmodell eingeschlossene Fläche definiert. Eine ausschließende Begrenzung ist eine Linie, die eine aus dem Höhenlinienmodell auszuschließende Fläche definiert. Wenn z. B. die Seiten eines Gebäudes als ausschließende Begrenzung definiert wären, dann würden Höhenlinien nicht durch das Gebäude gezogen. Ausschließende Begrenzungen sollten innerhalb von einschließenden Begrenzungen definiert werden; wenn aber eine einschließende Begrenzung innerhalb einer ausschließenden Begrenzung definiert wird, deaktiviert die ausschließende Begrenzung die einschließende Begrenzung.

Eine Begrenzung ist eine geschlossene Figur. Wenn eine Begrenzung nicht geschlossen ist, versucht die Software, diese beim Aktualisieren der Oberfläche automatisch zu schließen.

Überblick Bruchkanten

Bruchkanten sind eine Reihe von Linien, die ein konstantes Gefälle aufweisen. Die DTMLink™ Software verwendet das Gefälle der Linien, um das Dreiecksmodell auszugleichen. Der Kamm eines Grats oder die Seiten einer Trasse können z. B. als Bruchkante definiert werden, wenn DTMLink keine inkorrekten Interpolationen über die Linie hinaus vornehmen soll. Bruchkanten überkreuzen sich nicht, es sei denn, sie verlaufen durch einen gemeinsamen Schnittpunkt.

Begrenzungen und Bruchkanten werden als  Linien definiert, die Punkte aus der Datenbank miteinander verbinden.

Verarbeitungsauswirkung von Bruchkanten und Begrenzungen

Begrenzungen und Bruchkanten bewirken, daß die Dreiecke im Modell neu gebildet werden. Die folgenden Abbildungen veranschaulichen, wie die DTMLink Software das Modell neu erstellt, indem sie Bruchkanten erzeugt und Oberflächendreiecke bildet.

HINWEIS: Im Verlauf dieses gesamten Abschnitts werden Begrenzungen und Bruchkanten zwischen den Oberflächenpunkten A und B angezeigt. Die Scheitelpunkte von Dreiecken sind numeriert (wo zutreffend).

Beispiel 1: Bruchkante kreuzt ein Dreieck

Abb. 1 stellt ein vereinfachtes und untypisches Modell eines Dreiecks und einer Bruchkante dar. Die Bruchpunkte X und Y werden an den Schnittstellen des Dreiecks und der Bruchkante gebildet.

Abb. 1 Bruchkante vereinfacht

Die Höhen für die Punkte X und Y werden entlang der Bruchkante zwischen den Punkten A und B interpoliert. Diese Bruchpunkte werden dann im Modell zu Oberflächenpunkten, und drei neue Dreiecke werden geformt.

Beispiel 2: Bruchkante kreuzt mehrere Dreiecke

Abb. 2 stellt ein Dreiecksmodell mit definierter Bruchkante dar.

Abb. 2 Berechnung (1)

Die Neubildung eines Dreiecks folgt dem Verlauf der Bruchkante sequentiell, wobei ein Bruchpunkt an der Schnittstelle jeder Dreiecksseite mit der Bruchkante eingefügt wird. Diese Bruchpunkte sind in der Abbildung dargestellt. Die Höhen der Bruchpunkte werden entlang der Bruchkante zwischen den Punkten A und B interpoliert.

Die Bruchpunkte werden dann Teil des Höhenlinienmodells, und zehn neue Dreiecke werden gebildet, siehe Abb. 3. Die fettgedruckten Punkte weisen auf die neu gebildeten Dreiecke hin.

Abb. 3 Berechnung (2)

Beispiel 3: Begrenzung kreuzt ein Dreieck

Abb. 4 stellt ein vereinfachtes und untypisches Modell eines Dreiecks und einer Begrenzung dar. Die Bruchpunkte X und Y werden an den Schnittstellen des Dreiecks und der Begrenzung gebildet. Es wird davon ausgegangen, daß sich der Scheitelpunkt des Dreiecks (mit 1 beschriftet) innerhalb der Begrenzung befindet, und die Scheitelpunkte (mit 2 und 3 beschriftet) außerhalb der Begrenzung liegen.

Abb. 4 Begrenzung (1)

Die Höhe für Punkt X wird zwischen den Punkten 1 und 3 interpoliert. Die Höhe für Punkt Y wird zwischen den Punkten 1 und 2 interpoliert. Das Dreieck wird zwischen X, Y und 1 gebildet, und die Punkte 2 und 3 werden aus dem Höhenlinienmodell gelöscht.

Abb. 5 zeigt eine ähnliche Situation, in der eine Begrenzung durch ein geformtes Dreieck verläuft. Es wird wieder davon ausgegangen, daß Punkt 1 innerhalb der Begrenzung liegt.

Die Höhe für Punkt X wird zwischen den Punkten 1 und 3 interpoliert. Die Höhe für Punkt Y wird zwischen den Punkten 1 und 2 interpoliert.

Abb. 5 Begrenzung (2)

Zwei neue Dreiecke werden geformt, die Punkte 2 und 3 werden aus der Oberfläche gelöscht, und es werden neue Dreiecke gebildet.

Beispiel 4: Kombinierte Begrenzung und Bruchkante kreuzen ein Dreieck

Eine Linie kann die Merkmale einer Begrenzung und einer Bruchkante aufweisen, siehe Abb. 6.

Abb. 6 Begrenzung und Bruchkante

Bruchpunkte werden an den Punkten X und Y an der Schnittstelle des Dreiecks und der Bruchkante erzeugt.

Da es sich bei der Linie A-B um eine Bruchkante und eine Begrenzung handelt, werden die Höhen für die Bruchpunkte X und Y entlang der Bruchkante zwischen den Punkten A und B interpoliert.

Das durch die Punkte 1, X und Y definierte Dreieck wird gebildet, wenn der Scheitelpunkt 1 innerhalb der Begrenzung liegt. Die Punkte 2 und 3 werden aus dem Modell gelöscht.


Alle Linien löschen
Entwurf / Alle Linien löschen

Verwenden Sie diesen Befehl, um alle Bruchkanten oder Begrenzungen auf der Oberfläche zu löschen.

Es erscheint eine Warnmeldung.

Diese Operation kann nicht rückgängig gemacht werden. Klicken Sie auf OK, um alle Bruchkanten und Begrenzungen von dieser Oberfläche zu entfernen.

Klicken Sie auf OK, wenn Sie alle Bruchkanten und Begrenzungen permanent löschen möchten.

Die Oberfläche wird aktualisiert, wenn Sie auf OK klicken.


Hinzufügen einer Bruchkante unter Verwendung des Symbols Bruchkante hinzufügen

So fügen Sie eine Bruchkante unter Verwendung des Symbols Bruchkante hinzufügen hinzu:

1.	Klicken Sie auf das Symbol Bruchkante hinzufügen [image] auf der Oberflächen-Symbolleiste.

Der Cursor nimmt die Form [image] an, wenn der Vorgang aktiviert ist.

2.	Klicken Sie auf den Oberflächenpunkt, an dem die Bruchkante beginnt.

3.	Fahren Sie fort, Teile der Bruchkante hinzuzufügen, indem Sie Oberflächenpunkte wählen.

Auf dem Bildschirm wird zwischen den gewählten Oberflächenpunkten eine rote Linie gezogen.

Nach dem Hinzufügen von Linien verändert sich die Aktualisierungsanzeige auf der Statusleiste, um anzuzeigen, daß die Oberfläche aktualisiert werden muß.

4.	Um die Oberfläche zu aktualisieren, führen Sie einen der folgenden Vorgänge durch:

  Betätigen Sie F4.

  Verwenden Sie den Befehl Entwurf / Oberfl. aktual.

5.	Um das Hinzufügen einer Bruchkante zu beenden, wählen Sie ein anderes Symbol, oder betätigen Sie F2.

So fügen Sie eine weitere Bruchkante hinzu:

  Klicken Sie erneut auf das Symbol Bruchkante hinzufügen, und wiederholen Sie die obigen Schritte 1 bis 5.

TIP: Fügen Sie eine Bruchkante und eine Begrenzung mit folgenden Symbolen hinzu:

  Symbol Begrenzung einschließen

  Symbol Begrenzung ausschließen

Wählen Sie Begrenzung und Bruchkante aus dem Dropdown-Menü.


Menü "Entwurf"
Menü “Entwurf”

Verwenden Sie das Menü “Entwurf”, um eine Oberfläche zu bearbeiten. Es verfügt über die folgenden Befehle:

Punkt einschließen

Punkt ausschließen

Dreiecke auswechseln

Dreiecke löschen

Linie hinzufügen

Oberfl. aktual.

Linie löschen

Alle Linien löschen


Technische Unterstützung

Wenn Sie ein Problem haben und die benötigten Informationen nicht in der Dokumentation des Produkts finden können, wenden Sie sich an Ihren Trimble-Händler. Alternativ dazu können Sie auch Unterstützung über die Trimble-Website anfordern (http://www.trimble.com/support.html/).


Warenzeichen

Das Trimble-Logo mit Trimble ist ein beim US Patent and Trademark Office eingetragenes Warenzeichen von Trimble Navigation Limited.

DTMLink, RoadLink, Trimble Geomatics Office und Trimble Survey Controller sind Warenzeichen von Trimble Navigation Limited.

Alle anderen Marken oder Produktnamen sind Warenzeichen ihrer entsprechenden Eigentümer.


Garantiebestimmungen

Garantieausschluß

Außer in den im folgenden dargelegten “Garantieeinschränkungen”, wird Trimble Hardware, Software, Firmware und die Dokumentation “wie gesehen” angeboten, ohne ausdrückliche oder eingeschränkte Garantie jeglicher Art sowohl von seiten der Trimble Navigation Limited als auch von jeglichen Personen, die an der Erzeugung, Herstellung oder dem Vertrieb beteiligt waren, einschließlich aber nicht begrenzt auf, die angenommenen Garantien auf Verwertbarkeit und Verwendbarkeit für eine bestimmte Anwendung. Das gesamte Risiko für Qualität und Leistungsfähigkeit der Trimble Hardware, Software, Firmware und Dokumentation wird vom Endkunden getragen. In einige Staaten ist der Ausschluß von angenommenen Garantien nicht erlaubt, daher trifft obiger Ausschluß möglicherweise für Sie nicht zu.

Haftungsausschluß

Unter keinen Umständen ist Trimble Navigation Limited oder jegliche Personen, die an der Erzeugung, Herstellung oder dem Vertrieb der Trimble Software beteiligt waren, Ihnen gegenüber für jegliche Art von Schadensersatzansprüchen haftbar, einschließlich Gewinnverlust oder andere spezielle, zufällige, folgende oder über den verursachten Schaden hinausgehende Schäden, einschließlich aber nicht begrenzt auf jegliche Art von Schäden, die gegen Sie entstehen oder für die Sie an Dritte bezahlt haben, hervorgerufen aus der Verwendung entstehenden Haftung, Qualität oder Leistungsfähigkeit solcher Trimble-Software und -Dokumentation, auch dann, wenn Trimble Navigation Limited oder einer solchen Person oder Stelle die Möglichkeit solcher Schäden bekannt gemacht wurde, oder für jeden Anspruch Dritter. Einige Staaten erlauben den Haftungsausschluß für zufällige Schäden oder Folgeschäden nicht, daher treffen diese obigen Ausschlüsse möglicherweise für Sie nicht zu.

Garantieeinschränkungen für Software und Firmware

Trimble Navigation Limited garantiert, daß Software- und Firmware-Produkte die veröffentlichten Spezifikationen im wesentlichen erfüllen, vorausgesetzt sie werden mit den Trimble-Produkten, Computerprodukten und Betriebssystemen betrieben, für die sie entwickelt wurden. Für die Dauer von neunzig (90) Tagen, beginnend dreißig (30) Tagen nach Versand durch Trimble, garantiert Trimble auch, daß der Datenträger, auf dem die Software oder Firmware vertrieben wurde, und die Dokumentation frei von Fehlern in Material und Verarbeitung sind. Während dieser Garantiezeit von neunzig (90) Tagen ersetzt Trimble fehlerhafte Datenträger oder Dokumentationen, oder behebt wesentliche Programmfehler kostenlos. Sollte Trimble den fehlerhafte Datenträger oder die Dokumentation nicht ersetzen oder den Programmfehler nicht beheben können, ersetzt Trimble den für die Software bezahlten Preis. Dies ist Ihr einziger Rechtsanspruch für jeglichen Bruch der Garantie.


World Wide Web-Adresse
World Wide Web (WWW)-Adresse

Besuchen Sie die Trimble World Wide Web-Adresse für einen interaktiven Einblick bei Trimble (http://www.trimble.com/)


Feedback

Wir bedanken uns für die Wahl dieses Produkts. Wir wären Ihnen dankbar, wenn Sie uns Feedback zukommen lassen würden. Kommentare und Vorschläge können direkt an die folgende Adresse geschickt werden:

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642
Sunnyvale, CA 94088-3642
U.S.A.

Telefon: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
http://www.trimble.com/

Wenn Sie uns Kommentare und Vorschläge zukommen lassen möchten, nehmen Sie mit uns Kontakt auf. Ihr Feedback trägt zur Verbesserung zukünftiger Revisionen bei. Wir bedanken uns für besonders hilfreiche Beiträge mit einem Dankeschön-Geschenk.

Senden Sie Ihre Kommentare und Vorschläge an vorstehend genannte Adresse oder schicken Sie ein E-mail an ReaderFeedback@trimble.com

Alle Kommentare und Vorschläge werden Eigentum von Trimble Navigation Limited.