Copyright: ©1999-2002 Trimble Navigation Limited. All rights reserved.
Citation: ©1999-2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office - Überblick
Trimble Geomatics Office — Überblick

Trimble Geomatics Office ermöglicht Ihnen die Integration von Daten, die mit unterschiedlichen Vermessungsmethoden aufgezeichnet wurden, einschließlich GPS- (RTK und nachverarbeitet) und konventionellen optischen Instrumenten (darunter Servo- und Robotic-Instrumente). Umfangreiche Hilfsmittel zur Qualitätskontrolle ermöglichen Ihnen eine schnellere und effizientere Aufgabendurchführung für eine reibungslose Datenübertragung vom Feld zum Büro und wieder zurück zum Feld.

Verwenden Sie Trimble Geomatics Office für:

  die GPS-Basislinienverarbeitung (wenn das WAVE Baseline Processing Modul (Basislinienverarbeitungsmodul) installiert ist)

  die Vermessungsnetzausgleichung (wenn das Network Adjustment Modul (Netzausgleichungsmodul) installiert ist)

  die Verarbeitung von GPS- und konventionellen topographischen Vermessungsdaten

  die Qualitätssicherung und Qualitätskontrolle von Daten (QA/QC)

  das Importieren und Exportieren von Trassenentwurfsdaten

  das Importieren und Exportieren von Vermessungsdaten

  das Erstellen von digitalen Geländemodellen und Höhenlinien

  die Datum-Transformation und Projektionen

  das Erfassen und Exportieren von GIS-Daten

  die Kartierkodierung

  das Erstellen von Projektberichten

  die Verwaltung von Vermessungsprojekten

Wichtigste Leistungsmerkmale

Nachfolgend sind die wichtigsten Leistungsmerkmale von Trimble Geomatics Office (Version 1.6) aufgeführt:

  Darstellungen der Projektdaten im Graphikfenster in der Vermessungs- und Planansicht

  Projektleiste verwaltet häufig verwendete Aufgaben im Hauptgraphikfenster in Form von Verknüpfungen

  Ansichtsfilter ermöglichen das Ein- oder Ausblenden von Beobachtungstypen

  Die Drag-Drop-Funktion ermöglicht Ihnen, jede Projektdatei vom Desktop zu ziehen und im Projektbereich abzulegen

  Importieren von Daten, die von GPS-Empfängern und/oder konventionellen Totalstationen erfaßt wurden

  Umfangreiche Import- und Exportformate

  Das Dialogfeld DAT-Checkin erlaubt das Überprüfen und Bearbeiten von GPS-Rohdaten vor dem Importieren

  Mit Hilfe des Eigenschaftsfensters können Sie alle relevanten Informationen für Punkte sowie Beobachtungstypen ansehen und bearbeiten

  Das Dialogfeld Mehrfachbearbeitung für die schnelle Bearbeitung mehrerer Elemente

  Unterstützung der GIS-Datenerfassung

  Layer-Unterstützung zur Verwaltung von CAD-Daten

  Professionelle Wiedergabe von HTML-Berichten

  Standard- und benutzerdefinierte Berichtsformate

  RoadLink- und DTMLink-Module zur Ansicht und Bearbeitung von Trassenentwurfsdateien anderer Herkunft und zur Erzeugung von digitalen Geländemodellen.

HINWEIS: Trimble Geomatics Office unterstützt keine 8.3 Dateinamensysteme.

Module

Nachfolgend werden die zusätzlichen Module beschrieben, die für Trimble Geomatics Office verfügbar sind:

   Das WAVE-Baseline Processing Modul (Basislinienverarbeitungsmodul) berechnet Basislinien von GPS-Feldbeobachtungen, die unter Verwendung von statischen, FastStatic- oder kinematischen Datenerfassungsmethoden vorgenommen werden. Das WAVE-Basislinienverarbeitungsprogramm ermöglicht die Standardverarbeitung und enthält flexible Steuerungen für die fortgeschrittene Verarbeitung. Timeline stellt GPS-Daten in Rohbeobachtungsdateien in einem graphischen Zeitformat dar. Verwenden Sie dieses zur Ansicht und Bearbeitung von GPS-Rohmessungen und Vermessungsinformationen.

  Das Network Adjustment Modul (Netzausgleichungsmodul) gleicht GPS- und terrestrische Vermessungsdaten aus, um die vorhandenen Fehler einzuschätzen und zu reduzieren.

Was ist Geomatics?

Geomatics ist der Entwurf, die Erfassung, Speicherung, Analyse, Darstellung und das Laden räumlicher Informationen. Die Erfassung räumlicher Informationen kann aus einer Reihe von Quellen erfolgen, einschließlich GPS und terrestrischer Methoden. Geomatics verbindet traditionelles Vermessen mit Ansätzen neuer Technologien und ist somit nützlich für zahlreiche Anwendungen.


Entfernen der Software

ACHTUNG: Der in diesem Thema beschrieebene Vorgang entfernt alle Dateien mit Ausnahme der gemeinsamen Dateien, Vorlagen und Datendateien. Verwenden Sie Microsoft Windows Explorer, um Daten-Dateien zu löschen.

So entfernen Sie Trimble Geomatics Office von Ihrem Computer:

1.	Wählen Sie Start / Einstellungen / Systemsteuerung.

2.	Wählen Sie Software in der Systemsteuerung. Das Dialogfeld Software wird eingeblendet.

3.	Stellen Sie sicher, daß das Register Installieren/Deinstallieren aktiviert ist.

4.	Wählen Sie Trimble Geomatics Office.

5.	Klicken Sie auf Hinzufügen/Entfernen. Die Meldung Löschen von Dateien bestätigen erscheint.

6.	Klicken Sie auf Ja.

Die Dateien werden gelöscht.

ACHTUNG: Wenn Sie Trimble Geomatics Office deinstallieren, verlieren Sie alle benutzerdefinierten Formate. Wenn Sie z. B. Symboltypen zur systemerzeugten Symbol-Bibliothek (Symbols.sym) oder benutzerdefinierte Import-/Exportformate hinzugefügt haben, werden diese verloren gehen.

Benutzerdefinierte Informationen werden in folgenden Dateien gespeichert:

  Planrahmendateien (*.frm) — benutzerdefiniert, indem diese Datei mit einem Text-Editor bearbeitet wird

  Berichtsformatdateien (Asciirpt.dat) — benutzerdefiniert, wenn Sie benutzerdefinierte Dateien erzeugen

  ASCII-Importdefinitions-Dateien (Asciiimp.dat) — benutzerdefiniert, wenn Sie benutzerdefinierte Importformate erzeugen

  ASCII-Exportdefinitions-Dateien (Asciiexp.dat) — benutzerdefiniert, wenn Sie benutzerdefinierte Exportformate erzeugen

  Systemerzeugte Symbol-Bibliothek (Symbols.sym) — benutzerdefiniert, wenn Sie neue Symboltypen in dieser Datei speichern

  Systemerzeugte Linientyp-Bibliothek (Linetype.ltp) — benutzerdefiniert, wenn Sie neue Linientypen in dieser Datei speichern


Ordnerstruktur

Bei der Installation werden alle erforderlichen Dateien, die Trimble Geomatics Office benötigt, in die nachstehend aufgeführten Ordner kopiert:

Ordner	Was gespeichert wird
\Programme\Trimble\ Trimble Geomatics Office	Das Trimble Geomatics Office Programm und Hilfe-Dateien
...\System	System-Dateien, einschließlich Bibliotheksdateien der Feature and Attribute Editor Software, der Symbol Editor™ und Line Type Editor™ Dienstprogramme und der HTML-Berichtsvorlagen
...\Template	Dateien für Projektvorlagen
...\Utility	Verbindungen zu folgenden Dienstprogrammen: A1 Viewer, Convert to RINEX™, Coordinate System Manager™, Data Transfer, DC File Editor™, Feature and Attribute Editor™, Line Type Editor, Planning und Symbol Editor
...\RoadLink - DTMLink	Programmdateien und assoziierte Dateien für RoadLink und DTMLink
\Programme\Gemeinsame Dateien\ Trimble	Dateien, die sowohl von Trimble Geomatics Office, als auch von anderen Trimble-Produkten verwendet werden
...\GeoData	Dateien mit Koordinatensysteminformationen und Geoid-Dateien
...\GeoDB	Programmdateien für das Coordinate System Manager-Dienstprogramm
...\Data Transfer	Programmdateien für das Data Transfer-Dienstprogramm
...\DatToRinex	Programmdateien für das Convert to RINEX-Dienstprogramm
...\DCeditor	Programmdateien für das DC File Editor-Dienstprogramm
...\Plan	Programmdateien für das Planning-Dienstprogramm


Info über Trimble

Trimble ist führender Anbieter von Global Positioning System (GPS)-Technologie. Trimble bietet fortschrittliche GPS-Komponenten und verbindet GPS mit anderen Positionierungstechnologien, drahtloser Kommunikation und Software, um seinen Kunden Komplettlösungen zu bieten. Trimble ist u. a. aktiv im Bereich der Vermessung, Fahrzeugnavigation, Maschinenführung- und -steuerung, Objektlokalisierung, drahtlosen Plattformen und Telekommunikationsinfrastruktur tätig.

Die Büros des Trimble-Unternehmens befinden sich in 645 N. Mary Avenue in Sunnyvale, CA. Darüber hinaus stehen Büros in der ganzen Welt zu Ihrer Verfügung.

Besuchen Sie unsere Seite im WorldWideWeb für einen interaktiven Blick auf Trimble:

www.trimble.com


Befehl Richtungswinkel/Strecke

Verwenden Sie diesen Befehl, um Richtungswinkel/Strecke (Inverse) zwischen zwei Projektpunkten zu ermitteln.

Wählen Sie hierzu Vermessung / Richtungswinkel/Strecke.

Das Dialogfeld RIWI/Strecke erscheint.


Dialogfeld RIWI/Strecke

Verwenden Sie dieses Dialogfeld, um Richtungswinkel/Strecke zwischen zwei Projektpunkten zu ermitteln. Sie können das Dialogfeld verwenden, um kurze und detaillierte Informationen über Richtungswinkel/Strecke anzuzeigen und einen Bericht zu erzeugen.

Führen Sie dazu einen der folgenden Schritte aus:

  Wählen Sie Vermessung / Richtungswinkel/Strecke.

  Drücken Sie F7.

HINWEIS: Das Hilfsmittel Richtungswinkel/Strecke arbeitet mit bestehenden Punkten. Um Azimute und Strecken zwischen beliebigen anderen Koordinatenpositionen anzuzeigen, verwenden Sie das Hilfsmittel Messen. Wählen Sie hierzu Vermessung / Messen.

Von

Geben Sie einen Punktnamen mit der Tastatur ein, oder verwenden Sie die graphische Auswahl, um einen Punkt anzuklicken.

Zu

Geben Sie einen Punktnamen mit der Tastatur ein, oder verwenden Sie die graphische Auswahl, um einen Punkt anzuklicken.

Wenn Sie den Mauszeiger in die Nähe eines weiteren Punkts bewegen, erscheint eine gepunktete Linie. Sie zeigt die zu berechnende Richtungswinkel/Strecke an. Wenn Sie den zweiten Punkt anklicken, wird die gepunktete Linie zu einer durchgezogenen Linie. Dies ist die Linie, auf die sich die Richtungswinkel/Strecken-Details beziehen.

Wenn die Einstellung „Strecke anzeigen als“ im Register Einheiten und Format des Dialogfelds Projekteigenschaften auf Gitter- oder NN-Strecken eingestellt ist, und die beiden Punkte keine orthometrischen Höhen haben, werden Gitterstrecke und -Azimut angezeigt. Wenn jedoch das Feld „Strecke anzeigen als“ auf Bodenstrecken eingestellt ist, und beide RIWI/Strecken-Punkte Null-Höhen haben, dann wird für die Strecke Null angezeigt (wenn die Standardhöhe auf Null voreingestellt ist). Die Bodenstrecke kann ohne Höheninformationen nicht berechnet werden.

Gitternetz-Azimut

Dieses Feld zeigt den Gitternetz-Azimut zwischen den Punkten an.

Gitterstrecke

Dieses Feld zeigt die Gitterstrecke zwischen den Punkten an.

Höhenunterschied

Wenn beide Punkte orthometrische Höhen haben, wird der Höhenunterschied angezeigt. Wenn eine Höhe unbekannt ist, zeigt dieses Feld Null an.

Methode

Zwei Methoden zur Berechnung von RIWI/Strecke sind verfügbar:

Sequentiell	um eine Reihe von Richtungswinkeln/Strecken nacheinander zu berechnen

Radial	um eine Reihe von Richtungswinkeln/Strecken von einem gemeinsamen Startpunkt aus zu berechnen

Berechnen

Klicken Sie auf Berechnen, um Richtungswinkel/Strecke zu berechnen, wenn Sie die gewählten Punkte mit der Tastatur eingegeben haben.

Zu Bericht senden

Klicken Sie auf Zu Bericht senden, um einen Bericht der Richtungswinkel/Strecken-Berechnung zu erzeugen. Es kann ein kurzer oder detaillierter Bericht erzeugt werden, abhängig von der für Richtungswinkel/Strecke verwendeten Anzeigeoption.

HINWEIS: Wenn der Bericht mit einer bestimmten Anzeigeoption erzeugt wurde und dann erneut in einem anderen Anzeigemodus erzeugt wird, werden die Richtungswinkel/Strecken-Details des Berichts zu dem bestehenden Bericht hinzugefügt.

Bericht anzeigen

Klicken Sie auf Bericht anzeigen, um den erzeugten Bericht Richtungswinkel/Strecke anzuzeigen.

Der kurze Bericht enthält die Richtungswinkel/Strecken-Details wie im Dialogfeld RIWI/Strecke im Kurzmodus angezeigt.

Der detaillierte Bericht zeigt die Positionen der “Von”- und “Zu”-Punkte in den Gitter-, örtlichen (geodätischen) und kartesischen (WGS-84) Koordinatensystemen an. Er enthält ebenfalls die berechneten Richtungswinkel/Strecken-Werte und die Parameter, die zur Reduzierung von Richtungswinkel/Strecke in den Koordinatensystemen verwendet wurden.

Detailliert / Kurz

Klicken Sie auf Detailliert, um die Gruppe Details anzuzeigen. Wenn die Gruppe Details angezeigt wird, ändert sich die Schaltfläche zu Kurz. Klicken Sie auf Kurz, um die Gruppe Details auszublenden.

Details

Die Gruppe Details zeigt zusätzliche Informationen über Richtungswinkel/Strecke an.

Ell. Azimut vorw.

Dieses Feld zeigt den ellipsoidischen (geodätischen) Azimut vorwärts vom ersten Punkt zum zweiten Punkt an.

Ell. Azimut rückw.

Dieses Feld zeigt den ellipsoidischen (geodätischen) Azimut rückwärts vom zweiten Punkt zum ersten Punkt an.

Ellipsoid-Strecke

Dieses Feld zeigt die Ellipsoid-Strecke zwischen den Punkten an.

Bodenstrecke

Dieses Feld zeigt die Bodenstrecke zwischen den Punkten an.

Delta Höhe

Dieses Feld zeigt die Delta (ellipsoidische) Höhe zwischen den Punkten an.


Befehl Messen

Verwenden Sie diesen Befehl, um Azimute, Strecken und Flächen in beliebigen Graphikfenstern zu messen.

Wählen Sie hierzu Vermessung / Messen.

Das Dialogfeld Messen erscheint.


Dialogfeld Messen

Verwenden Sie dieses Dialogfeld, um Azimute, Strecken und Flächen in beliebigen Graphikfenstern zu messen.

Wählen Sie hierzu Vermessung / Messen.

Sie können zwischen Projektpunkten oder Positionen auf dem Bildschirm messen (klicken Sie auf die entsprechende Position).

Nachdem Sie zwei oder mehrere Positionen ausgewählt haben, wird die Gesamtstrecke zwischen der ersten und letzten Position im Strecken-Feld angezeigt. Das Azimut-Feld zeigt den Azimut zwischen den letzten beiden ausgewählten Positionen an.

TIP: Wenn Sie auf die Maus klicken und ziehen, zeigen die Felder den aktuellen Azimut, die Gesamtstrecke vom ersten ausgewählten Punkt und die eingeschlossene Fläche an.

Azimut

Wenn Sie zwei Positionen auswählen, wird der Gitter-Azimut zwischen diesen Punkten angezeigt. Sind drei oder mehr Punkte ausgewählt, zeigt dieses Feld den Azimut zwischen den letzten beiden Punkten an.

Strecke

Wenn Sie zwei Positionen auswählen, wird die Strecke zwischen den beiden Punkten angezeigt. Sind drei oder mehr Punkte ausgewählt, zeigt dieses Feld die aufaddierte Gesamtstrecke der gemessenen Strecken an.

Gesamtstrecken werden mit den festgelegten Anzeigeeinstellungen ausgegeben.

HINWEIS: Wenn das Feld "Strecke anzeigen als" im Dialogfeld Projekteigenschaften auf Bodenstrecken eingestellt ist, und beide gemessenen Positionen Null-Höhen haben, wird für die Strecke der Wert Null angezeigt (wenn die Standardhöhe auf Null eingestellt ist). Ohne Höheninformation kann die Software die Bodenstrecke nicht berechnen.

Fläche

Wenn drei oder mehr Punkte ausgewählt sind, die eine Fläche umschließen, wird diese Fläche berechnet.

Die berechnete Fläche variiert abhängig von der Einstellung für die Streckenanzeige:

  Die Einstellung Bodenstrecken ergibt eine auf der durchschnittlichen Bodenhöhe berechnete Fläche.

  Die Einstellung Ellipsoid-Strecken (NN-Strecken) ergibt eine auf der Ellipsoid-Oberfläche berechnete Fläche.

  Die Einstellung Gitter-Strecken ergibt eine aus den Gitter-Koordinaten berechnete Fläche.

Zurücksetzen

Klicken Sie auf Zurücksetzen, um alle Felder zu löschen. Sie können sie auch durch Doppelklicken auf den Startpunkt zurücksetzen.

TIP: Sie können schnell die Ausdehnung des im Graphikfenster angezeigten Projekts bestimmen, indem Sie auf den Dimensionsindikator des Graphikfensters [image] in der Statusleiste klicken. Positionieren Sie den Cursor außerhalb des Graphikfensters, um diesen Indikator anzusehen.

Wenn Sie den Zeiger [image] verwenden, drücken Sie Strg. Dies verhindert, daß er auf einem nahegelegenen Punkt einrastet.


Koordinatentransformation - Überblick
Koordinatentransformation − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Eine Koordinatentransformation verschiebt die Punkte im Projekt. Sie kann Verschiebungen, Rotationen und Skalierungen in zwei Dimensionen umfassen. Punkte mit Festpunktqualität oder mit der Qualität Ausgeglichen werden nicht bewegt. Eine Meldung erscheint, wenn ein zum Verschieben ausgewählter Punkt die Qualität Fest oder Ausgeglichen hat.

Sie können eine Koordinatentransformation z. B. verwenden, wenn ein Projekt Punkte aus einem Entwurfssoftwarepaket eines Drittanbieters enthält, die sich in einem angenommenen Koordinatensystem befinden, und Sie diese Punkte transformieren müssen, um korrekte Koordinaten zu erhalten.

Sie können eine der folgenden Methoden anwenden, um die Koordinatentransformation zu definieren:

  Verwenden Sie die graphische Auswahl, klicken Sie auf Punkte, geben Sie dann deren bekannte Koordinatenwerte ein. Werden mehr als drei Punkte verwendet, benutzt die Software die Kleinste-Quadrate-Methode, um die Transformationsparameter für die ausgewählten Punkte zu berechnen

 Legen Sie Transformationsparameter fest

Wenn Sie eine Koordinatentransformation durchführen, werden alle anderen Beobachtungen zu dem Punkt deaktiviert. Die angezeigten Gitter-, örtlichen und WGS-84-Koordinaten für den transformierten Punkt werden geändert, nicht jedoch das Koordinatensystem.

Nachdem Sie eine Transformation durchgeführt haben, können Sie einen Bericht erzeugen, der die ursprünglichen und die transformierten Koordinatenwerte enthält.


Befehl Koordinatentransformation

Verwenden Sie diesen Befehl, um eine horizontale Transformation zu bestimmen und anzuwenden.

Wählen Sie hierzu Vermessung / Koordinatentransformation.

Das Dialogfeld Koordinatentransformation erscheint.


Dialogfeld Koordinatentransformation

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld um eine horizontale Transformation zu bestimmen und anzuwenden.

Wählen Sie hierzu Vermessung / Koordinatentransformation.

Wenden Sie eine der folgenden Methoden an, um Werte in dieses Dialogfeld einzugeben:

  Klicken Sie auf Punktliste, um Punkte im Projekt auszuwählen, für die bekannte Koordinaten existieren, und geben Sie die bekannten Werte für jeden Punkt ein. Die Software berechnet die Transformationsparameter. Wenn es mehr als drei Punktwerte gibt, verwendet sie die Kleinste-Quadrate-Methode. In der Punktliste wird eine Statistik angezeigt, mit deren Hilfe Sie überprüfen können, ob die Punkte korrekt zu der Liste hinzugefügt wurden. Das Dialogfeld Koordinatentransformation zeigt die Transformationswerte an.

  Geben Sie die Werte mit der Tastatur ein.

Wenn Sie eine Koordinatentransformation durchführen, werden alle anderen Beobachtungen zu dem Punkt deaktiviert. Die angezeigten Gitter-, örtlichen und WGS-84-Koordinaten für den transformierten Punkt werden geändert. Das Koordinatensystem wird nicht geändert.

Re-Verschiebung

Zeigt den Betrag der Verschiebung nach rechts (positiv) oder links (negativ) an.

Ho-Verschiebung

Zeigt den Betrag der Verschiebung nach oben (positiv) oder unten (negativ) an.

Rotation

Zeigt den Betrag der Winkeldrehung an, die in der Transformation angewendet wird.

Maßstab

Zeigt die Maßstabsänderung der Transformation an.

Ursprung Rotation

Die folgenden Felder zeigen die Position des Rotationsmittelpunkts an:

Punkt	zeigt den Namen des Punkts an, der als Ursprungspunkt für die Rotation verwendet wird. Wenn Sie einen Punktnamen eingeben, werden die Koordinaten in den Hochwert- und Rechtswert-Feldern angezeigt. Wenn Sie die Punktliste zur Berechnung der Parameter verwenden, zeigt dieses Feld den ersten ausgewählten Festpunkt an.
Hochwert	zeigt die Hochwert-Koordinate des Ursprungspunkts an.
Rechtswert	zeigt die Rechtswert-Koordinate des Ursprungspunkts an.
Transformieren

Wählen Sie eine der folgenden Optionen, um die Punkte zu transformieren:

Auswahl	wendet die Transformation auf ausgewählte Punkte an.
Ganze Datenbank	wendet die Transformation auf alle Projektpunkte an.
Wenn keine Punkte ausgewählt wurden, sind diese Optionen nicht verfügbar, und alle Punkte werden transformiert.

Den Koordinatentransformationsbericht erzeugen

Wählen Sie dieses Kontrollkästchen, um einen Bericht über die ursprünglichen und transformierten Koordinaten zu erzeugen. Der Bericht erscheint im voreingestellten HTML-Anzeigemodul.

Punktliste

Klicken Sie auf Punktliste, um die Festpunkte auszuwählen. Geben Sie die bekannten Werte für diese Punkte ein.

Das Dialogfeld Punktliste erscheint.


Dialogfeld Koordinatentransformation - Punktliste
Dialogfeld Koordinatentransformation − Punktliste

 Überblick und weitere Informationen

Verwenden Sie das Dialogfeld Koordinatentransformation – Punktliste, um die Punkte auszuwählen, die zur Berechnung der Parameter für die Koordinatentransformation verwendet werden sollen. Sie wählen die Punkte aus, Trimble Geomatics Office zeigt die aktuellen Koordinaten an, und Sie geben die bekannten Koordinaten ein. Trimble Geomatics Office berechnet die Transformationsparameter und wendet dann die Transformation auf die von Ihnen für die Transformation ausgewählten Punkte an.

So greifen Sie darauf zu:

1.	Wählen Sie Vermessung / Koordinatentransformation. Das Dialogfeld Koordinatentransformation erscheint.

2.	Klicken Sie auf Punktliste.

Dieses Dialogfeld zeigt eine Scroll-Liste mit Punkten an. Jeder Punkt hat Felder, die die aktuellen Koordinaten anzeigen, und Felder, die die bekannten Koordinaten anzeigen. Sie geben den Punktnamen ein, und die Felder Aktueller Hochwert und Aktueller Rechtswert werden angezeigt. Geben Sie dann die bekannten Koordinaten in die Felder Bekannter Hochwert und Bekannter Rechtswert ein.

TIP: Sie können den Punktnamen leer lassen und die graphische Auswahl verwenden, um die aktuellen Koordinaten einzugeben.

Es gibt keine Grenze für die Anzahl an Positionsdefinitionen, die zur Berechnung einer Koordinatentransformation definiert werden können. Das Hinzufügen vieler Positionsdefinitionen verbessert nicht immer die berechneten Transformationsresultate, aber es bietet eine zusätzliche Überprüfung der Gültigkeit der berechneten Parameter.

Statistik

In der Gruppe Statistik werden der Maßstabsfaktor und der maximale horizontale Restwert angezeigt. Verwenden Sie diese Statistik, um zu überprüfen, ob inkorrekte Werte eingegeben wurden.

Einfügen

Klicken Sie auf Einfügen, um einen leeren Positionsdefinitions-Datensatz einzufügen. Im allgemeinen fügt Trimble Geomatics Office neue Positionsdefinitions-Felder automatisch hinzu, damit Sie dies nicht zu oft durchführen müssen. Da jedoch der erste Punkt in der Punktliste als Rotationsursprung in den berechneten Transformationsparametern verwendet wird, möchten Sie vielleicht eine Positionsdefinition am Anfang der Liste einfügen.

Löschen

Klicken Sie auf Löschen, um eine Positionsdefinition aus der Liste zu löschen.


Höhenausgleichung - Überblick
Höhenausgleichung − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Eine Höhenausgleichung gleicht Punkthöhen aus.

Nachdem eine Ausgleichung durchgeführt wurde, wendet Trimble Geomatics Office die Höhenausgleichung unter Verwendung einer der folgenden Methoden an:

  Wo bekannte orthometrische Höhen für bestehende Punkte eingegeben werden, berechnet Trimble Geomatics Office die Parameter der Höhenausgleichung.

  Wo eine Konstante (positiv oder negativ) eingegeben wird, wendet Trimble Geomatics Office diese auf alle ausgewählten Punkte an.

HINWEIS: Die Höhenausgleichung wird nicht angewendet, wenn die ellipsoidischen oder orthometrischen Höhen Festpunktqualität oder die Qualität Ausgeglichen haben.

Höhenausgleichung − Resultate

Wenn Sie eine Höhenausgleichung durchführen, werden alle anderen Beobachtungen zu einem Punkt oder Gitter-Positionen für einen Punkt deaktiviert. Die angezeigten Gitter-, örtlichen und WGS-84-Koordinaten für die transformierten Punkte werden geändert. Das Koordinatensystem wird nicht geändert.

Die folgende Tabelle zeigt die Parameter an, die berechnet werden, wenn eine Reihe orthometrischer Höhen in der Punktliste enthalten ist.

HINWEIS: Die berechnete Höhenausgleichung ist nicht in der Definition des Koordinatensystems enthalten, im Gegensatz zur vertikalen Ausgleichung, die mit dem Befehl Vermessung / GPS-Kalibrierung ausgeführt werden kann.

Sie können einen Bericht erzeugen, der die ursprüngliche orthometrische Höhe, die ausgeglichene orthometrische Höhe und die Differenz zwischen den beiden enthält.


Befehl Höhenausgleichung

Verwenden Sie diesen Befehl, um eine Höhenausgleichung zu bestimmen und anzuwenden.

Wählen Sie hierzu Vermessung / Höhenausgleichung.

Das Dialogfeld Höhenausgleichung erscheint.


Dialogfeld Höhenausgleichung

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um eine Höhenausgleichung zu bestimmen und anzuwenden.

So greifen Sie darauf zu:

  Wählen Sie Vermessung / Höhenausgleichung.

Verwenden Sie eine der folgenden Methoden, um orthometrische Höhen ausgewählter Projektpunkte auszugleichen:

  die Konstante-Methode

  die Ebenenparameter-Methode (geben Sie die Werte ein, oder wählen Sie die Punkte aus)

Konstant

Wählen Sie diese Option, um einen konstanten Wert zu den orthometrischen Höhen der Punkte hinzuzufügen. Wenden Sie die Konstante auf ausgewählte Punkte oder auf das ganze Projekt an.

Zur Höhe addieren

Das Feld Zur Höhe addieren wird verfügbar, wenn Sie die Option Konstant wählen. Geben Sie einen positiven oder negativen Höhenwert ein, der zu den Punkten addiert werden soll.

Parameter

Wählen Sie diese Option, um die Parameter für die Höhenausgleichung einer geneigten Ebene festzulegen oder zu berechnen. Klicken Sie auf Punktliste, um die Festpunkte zur Berechnung der Parameter zu wählen.

Ursprung

Zeigt den Namen des Punkts an, der als Ursprungspunkt für die geneigte Ebene verwendet wird.

HINWEIS: Wenn die Punktliste zur Auswahl von Punkten für die Parameterberechnung verwendet wird, zeigt dieses Feld den ersten gewählten Festpunkt an.

Ursprung Re

Zeigt die Rechtswert-Koordinate des Ursprungspunkts an. Wenn Sie einen Punkt im Feld Ursprung wählen, wird dieses Feld mit den Koordinaten des gewählten Punkts ausgefüllt.

Ursprung Ho

Zeigt die Hochwert-Koordinate des Ursprungspunkts an. Wenn Sie einen Punkt im Feld Ursprung wählen, wird dieses Feld mit den Koordinaten des gewählten Punkts ausgefüllt.

Korrektur-Konstante

Zeigt die auf die Ursprungsposition angewandte Höhenkorrektur an.

Gefälle Hoch

Dieser Wert definiert die Neigung der Ebene in Nord-Süd-Richtung. Die Höhenausgleichung wird aus diesem Teile pro Million (ppm)-Wert und der Strecke (Nord-Süd-Richtung) vom Ursprung berechnet. Er wird zusätzlich zur Korrekturkonstante angewendet.

Gefälle Rechts

Dieser Wert definiert die Neigung der Ebene in Ost-West-Richtung. Die Höhenausgleichung wird aus diesem Teile pro Million (ppm)-Wert und der Strecke (Ost-West-Richtung) vom Ursprung berechnet. Er wird zusätzlich zur Korrekturkonstante angewendet.

Punktliste

Klicken Sie auf Punktliste, um die Festpunkte auszuwählen, die verwendet werden sollen, um die Parameter der Höhenausgleichung zu berechnen. Das Dialogfeld Punktliste erscheint.

Ausgleichen

Wählen Sie diese Option, um die Ausgleichung anzuwenden. Zwei Optionen sind verfügbar:

Auswahl	Wählen Sie diese Option, um die Ausgleichung auf ausgewählte Punkte anzuwenden.
Ganze Datenbank	Wählen Sie diese Option, um die Ausgleichung auf alle Projektpunkte anzuwenden.
Wenn keine Punkte gewählt sind, sind diese Optionen nicht verfügbar, und die Ausgleichung wird auf alle Punkte im Projekt angewendet.

Den Höhenausgleichungsbericht erzeugen

Wählen Sie dieses Kontrollkästchen, um einen Bericht der ursprünglichen und der ausgeglichenen orthometrischen Höhen zu erzeugen. Der Bericht erscheint im voreingestellten HTML-Anzeigemodul.


Dialogfeld Höhenausgleichung - Punktliste
Dialogfeld Höhenausgleichung − Punktliste

 Überblick und weitere Informationen

Trimble Geomatics Office verwendet die in diesem Dialogfeld ausgewählten Punkte zur Berechnung der Parameter für die Höhenausgleichung. Sie wählen die Punkte im Projekt aus und geben für die bekannten Punkte Punkthöhen ein.

So führen Sie dies durch:

1.	Wählen Sie Vermessung / Höhenausgleichung. Das Dialogfeld Höhenausgleichung erscheint.

2.	Klicken Sie auf Punktliste.

Wählen Sie die einzelnen Festpunkte mit der graphischen Auswahl oder über die Tastatur, und geben Sie die bekannte Höhe ein.

TIP: Die Koordinaten- und Höhenfelder können mit der graphischen Auswahl ausgefüllt werden, um geeignete Punkte vom Bildschirm zu wählen.

Normalerweise können Sie drei oder mehrere Festpunkte eingeben. Diese Punkte sollten gleichmäßig um die auszugleichenden Punkte verteilt sein.

Es gibt keine Grenze für die Anzahl an Punkten, die für die Berechnung einer Höhenausgleichung definiert werden können. Das Hinzufügen vieler Punktdefinitionen verbessert nicht immer die berechneten Ausgleichungsresultate, aber es bietet eine zusätzliche Überprüfungen der berechneten Parameter.

Statistik

In der Gruppe Statistik werden die maximale Ausgleichungsneigung und der maximale vertikale Restwert angezeigt. Verwenden Sie diese Statistik, um zu überprüfen, ob inkorrekte Werte eingegeben wurden.

Einfügen

Klicken Sie auf Einfügen, um einen leeren Punktdefinitions-Datensatz einzufügen. Im allgemeinen fügt Trimble Geomatics Office neue Punktdefinitions-Felder automatisch hinzu, und Sie müssen diese Schaltfläche nicht sehr oft verwenden. Da jedoch der erste Punkt in der Punktliste als Ursprungspunkt der Höhenausgleichung verwendet wird, können Sie diese Funktion verwenden, um einen gewünschten Punkt an den Anfang der Liste zu setzen. Allerdings ist die Position, die als Ursprung der Ausgleichung verwendet wird, normalerweise nicht von Bedeutung.

Löschen

Klicken Sie auf Löschen, um eine Punktdefinition aus der Liste zu löschen.


Befehl Rückgängig

Verwenden Sie diesen Befehl, um Vorgänge rückgängig zu machen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Rückgängig.

  Betätigen Sie Strg+Z.

Im Menü Bearbeiten zeigt der Text, der neben dem Befehl Rückgängig erscheint, den Vorgang an, der rückgängig gemacht werden kann. Vorgänge können nacheinander rückgängig gemacht werden. Der zuletzt durchgeführte Vorgang wird zuerst rückgängig gemacht. Falls Sie einen Vorgang aus Versehen rückgängig machen, verwenden Sie den Befehl Wiederholen.

Wenn Sie das Projekt oder Trimble Geomatics Office schließen, können Sie keine Vorgänge rückgängig machen, die durchgeführt wurden, als das Projekt oder die Software geöffnet war.

TIP: Wenn Sie einen Importvorgang rückgängig machen möchten, nachdem Sie das Projekt geschlossen haben, verwenden Sie die Option Aus Quelle(n) im Dialogfeld Punkte wählen / Register Allgemein, und löschen Sie die Auswahl, um den Importvorgang rückgängig zu machen.


Befehl Wiederholen

Verwenden Sie diesen Befehl, um Vorgänge zu wiederholen, die Sie unter Verwendung des Befehls Bearbeiten / Rückgängig rückgängig gemacht haben.

Führen Sie einen der folgenden Vorgänge aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Wiederholen.

  Betätigen Sie Strg+Y.

Im Menü Bearbeiten zeigt der Text, der neben dem Befehl Wiederholen erscheint, den Vorgang an, der wiederholt werden kann.

Vorgänge können nacheinander wiederholt werden.

Wenn Sie das Projekt schließen, können Sie keine Vorgänge wiederholen, die Sie durchgeführt haben, als das Projekt geöffnet war.


Befehl Ausschneiden / Kopieren / Einfügen

Die Befehle Ausschneiden oder Kopieren und Einfügen bieten sich an, um die aktuelle Auswahl von Daten zu verschieben oder zu kopieren.

Wählen Sie Ausschneiden, Kopieren oder Einfügen im Menü Bearbeiten:

  Ausschneiden entfernt die Auswahl aus dem aktuellen Projekt.

  Kopieren erstellt ein Duplikat der Auswahl.

  Einfügen fügt die Auswahl in ein anderes Projekt oder eine andere Software-Anwendung ein.

Wenn Sie eine Auswahl ausschneiden oder kopieren, wird diese in der Zwischenablage gespeichert. Jedes neue Ausschneiden oder Kopieren ersetzt die vorherige Auswahl.

Die Kopie der Auswahl verbleibt in der Zwischenablage, nachdem Sie die Auswahl in ein Projekt oder eine andere Software-Anwendung eingefügt haben. Sie können die Auswahl daraufhin erneut oder so oft wie nötig an einer anderen Stelle einfügen.

Verwenden Sie diese Befehle, um:

  Daten zwischen Projekten zu übertragen (Sie können z. B. Festpunkte zwischen Projekten kopieren)

  Punkte mit Attributen von einem Projekt in ein anderes zu kopieren und einzufügen

  die CAD-Arbeit zu kopieren und in einen Bericht einzufügen

  Daten in ein Projekt mit einem unterschiedlichen Koordinatensystem zu kopieren (Punkte können z. B. von einem Projekt mit einem NAD-27-Koordinatensystem kopiert und in ein Projekt mit einem NAD-83-Koordinatensystem eingefügt werden)

Die kopierten Elemente werden in ein Projekt eingefügt, indem die mit diesen Elementen verknüpften Koordinatenwerte verwendet werden. Dadurch werden die Elemente korrekt positioniert, da die Koordinatenwerte automatisch in das neue Koordinatensystem konvertiert werden, wenn das Projekt, in das Sie Elemente einfügen, eine andere Koordinatensystemdefinition für die Elemente aufweist als das Quellprojekt.

HINWEIS: Sie müssen das Trimble Datenaustauschformat verwenden, um Beobachtungen zwischen Projekten zu kopieren und einzufügen. Sie können Beobachtungen nicht zwischen Projekten in Trimble Geomatics Office kopieren und einfügen.


Befehl Löschen

Verwenden Sie diesen Befehl, um die gegenwärtig ausgewählten Elemente zu löschen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Löschen.

  Betätigen Sie Entf.

So machen Sie den Befehl Löschen rückgängig:

  Wählen Sie Bearbeiten / Rückgängig.


Befehl Punkte umbenennen

Verwenden Sie diesen Befehl zum Umbenennen von Punkten.

Wählen Sie Bearbeiten / Punkte umbenennen, um darauf zuzugreifen.

Das Dialogfeld Umbenennen erscheint.


Dialogfeld Umbenennen

 Überblick und weitere Informationen

Wenn es in einem Projekt viele unterschiedliche Punkte gleichen Namens gibt, können Sie die doppelten Punkte auflösen, indem Sie sie mit Hilfe des Dialogfeldes Umbenennen umbenennen.

Beispiel

Sie importieren zwei Survey Controller-Dateien, die von verschiedenen Vermessungsteams im Feld aufgezeichnet wurden:

  Ein Feld-Team verwendet Punktnamen von 1000 bis 2000.

  Das andere Feld-Team verwendet Punktnamen von 1000 bis 1050.

Wenn die Dateien importiert werden, während die Option Doppelte Punkte innerhalb der Toleranz kombinieren im Dialogfeld Optionen doppelte Punkte gewählt ist, werden 51 doppelte Punkte (1000 bis 1050) in der Datenbank erzeugt.

Wenn die Dateien importiert werden, während die Option Doppelte Punkte immer kombinieren im Dialogfeld Optionen doppelte Punkte gewählt ist, teilt Ihnen die Software mit, welche doppelten Punkte sie kombiniert hat. Wenn Sie die doppelten Punkte umbenennen möchten, machen Sie das Importieren rückgängig, und benennen Sie sie um.

So führen Sie dies durch:

  Wählen Sie Bearbeiten / Punkte umbenennen. Das Dialogfeld Umbenennen erscheint.

Umbenennen

Wählen Sie eine der folgenden Optionen, um die Punkte umzubenennen:

Auswahl − Diese Option benennt die gewählten Punkte um.

Ganze Datenbank − Diese Option benennt alle Punkte um.

Wenn keine Punkte gewählt sind, werden gemäß Voreinstellung alle Punkte in der Datenbank umbenannt.

TIP: Wenn Sie Koordinaten aus einer .dc-Datei umbenennen möchten, verwenden Sie das Dialogfeld Punkte wählen, um Punkte aus der Quelle zu wählen.

Methode

Die Gruppe Methode bietet die folgenden Optionen:

Umbenennen von

Klicken Sie auf Umbenennen von, und geben Sie den ersten Namen ein, den Sie ersetzen möchten.

HINWEIS: Wenn Sie einen alphabetischen Namen eingeben, werden allen Punkten in der Auswahl dieselben Namen gegeben. Geben Sie einen numerischen Wert für das letzte Zeichen des Namens ein, um Punktnamen automatisch zu erhöhen, wenn eine Auswahl vorgenommen ist.

Präfix hinzufügen

Klicken Sie auf Präfix hinzufügen, und geben Sie ein Präfix ein. Um z. B. Topographische Punkte anzuzeigen, fügen Sie das Präfix TOPO zu dem gewählten bestehenden Punktnamen hinzu.

TIP: Verwenden Sie für das letzte Zeichen des Präfixes ein Leerzeichen. Der umbenannte Punkt wird so nicht mit dem Original verwechselt.

Suffix hinzufügen

Klicken Sie auf Suffix hinzufügen und geben Sie ein Suffix ein. Fügen Sie Punkten z. B. ein Suffix für das Datum hinzu, um das Vermessungsdatum (z. B.  08/10/99) anzuzeigen.

TIP: Verwenden Sie für das erste Zeichen des Suffixes ein Leerzeichen. Der umbenannte Punkt wird so nicht mit dem Original verwechselt.

Konstante hinzufügen

Verwenden Sie diese Option, um eine Konstante zu den gewählten Punkten hinzuzufügen. Der Konstantenwert kann positiv oder negativ sein. Die folgende Tabelle enthält einige Beispiele:

HINWEIS: P1023 - 1000 ergibt P23. Wenn das gewünschte Ergebnis P0023 ist, kann ein zweiter Umbenennungsvorgang, P23 + 0000, durchgeführt werden.

Bericht

Wählen Sie dieses Kontrollkästchen, um einen Bericht des Originals und neue Namen zu erstellen. Wenn Sie auf OK klicken, erscheint der Bericht im voreingestellten HTML-Anzeigemodul.


Befehl Eigenschaften

Verwenden Sie diesen Befehl, um das Eigenschaftsfenster zu öffnen.

Wählen Sie Bearbeiten / Eigenschaften, um auf diesen Befehl zuzugreifen.

Das Eigenschaftsfenster wird geöffnet.


CAD-Stile - Überblick
    CAD-Stile − Überblick

Weitere Informationen

Siehe auch	Dialogfeld
Überblick

In der Planansicht legen CAD-Stile fest, wie Elemente (Punkte, Linien und Text) in dem Trimble Geomatics Office Graphikfenster angezeigt werden.

CAD-Stile schließen ein:

  Punktstile

  Linienstile

  Textstile

Punktstile und Linienstile

Punktstile und Linienstile legen fest, wie Punkte und Linien angezeigt werden.

Ein Punktstil besteht aus einem Punktsymbol und Einstellungen, die die Größe, Farbe und Dimensionen des Symbols konfigurieren. Verwenden Sie das Symbol Editor-Programm, um Punktsymbole zu erzeugen und zu bearbeiten.

Ein Linienstil besteht aus einem Linientyp und Einstellungen, die die Größe, Farbe und Dimensionen des Typs konfigurieren. Verwenden Sie das Line Type Editor-Programm, um Linientypen zu erzeugen und zu bearbeiten.

Verwenden Sie einen der folgenden Vorgänge, um die Stile für einen Punkt oder eine Linie zu bestimmen:

  Das Eigenschaftsfenster.

  Kartiercode-Verarbeitung.

Verwenden Sie das Dialogfeld CAD-Stile in Trimble Geomatics Office oder das Programm Feature and Attribute Editor, um Punktstile zu erzeugen und zu bearbeiten.

Trimbles voreingestellte Vorlagen verfügen über einen Punktstil und Linienstil für jedes Symbol und jeden Linientyp in der Symbol- (*.sym) und Linientyp-(*.ltp)-Datei. Die Stile haben denselben Namen wie das Symbol oder der Linientyp.

Wenn das Punktstil- oder Linienstil-Feld eines Punkts oder einer Linie auf <Nach Layer> eingestellt ist, wird der den Punkten oder Linien zugeordnete Punktstil oder Linienstil von dem Layer übernommen. Die voreingestellten Stile sind für den Layer eingestellt, in dem sich die Punkte und Linien befinden.

Verwenden Sie das Dialogfeld Layer, um die voreingestellten Stile für verschiedene Layer einzustellen.

Textstile

Textstile legen fest, wie Textelemente in  Trimble Geomatics Office angezeigt werden. Verwenden Sie das Eigenschaftsfenster, um den Textstil für Textelemente einzustellen. Ein Textstil besteht aus einer Schriftart, Größeninformationen und einem Schriftartformat. Trimble stellt einen Textstil namens Standard zur Verfügung, aber Sie können Ihren eigenen Textstil erzeugen. Um dies durchzuführen, verwenden Sie das Dialogfeld CAD-Stile in  Trimble Geomatics Office.


    Befehl Stile

Verwenden Sie diesen Befehl, um Punktstile, Linienstile und Textstile zu erzeugen und zu verwalten.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Stile.

  Drücken Sie Strg+S.

Das Dialogfeld CAD-Stile erscheint.


    Dialogfeld CAD-Stile

 Überblick und weitere Informationen

Verwenden Sie das Dialogfeld CAD-Stile, um Punkt-, Linien- und Textstile zu erzeugen und zu verwalten.

So greifen Sie darauf zu:

  Wählen Sie Bearbeiten / Stile.

Neu

Öffnet das Dialogfeld Stil erzeugen und erzeugt einen neuen Stil basierend auf dem aktuellen Register.

Bearbeiten

Klicken Sie auf Bearbeiten, um einen bestehenden Stil zu bearbeiten. Wenn Sie einen CAD-Stil bearbeiten, der von einem Element im Projekt verwendet wird, wird das Element mit den neuen CAD-Stil-Einstellungen aktualisiert.

Löschen

Klicken Sie auf Löschen, um einen Stil zu löschen. Sie können alle CAD-Stile löschen, die nicht von einem Element im Projekt verwendet werden.


    Dialogfeld Punktstil erzeugen/bearbeiten

Verwenden Sie dieses Dialogfeld, um einen Punktstil zu erzeugen oder zu bearbeiten.

So greifen Sie auf dieses Dialogfeld zu:

1.	Wählen Sie Bearbeiten / Stile von der Planansicht. Das Dialogfeld CAD-Stile erscheint.

2.	Führen Sie im Register Punktstile einen der folgenden Schritte aus:

  Klicken Sie auf Neu. Das Dialogfeld Punktstil erzeugen erscheint.

  Klicken Sie auf Bearbeiten. Das Dialogfeld Punktstil bearbeiten erscheint. (Die Schaltfläche Bearbeiten wird verfügbar, sobald Sie einen Stil wählen.)

Name

Geben Sie den Namen eines neuen Punktstiles ein, oder benennen Sie einen bestehenden Punktstil um. Alle Punktstilnamen müssen eindeutig sein. Sie können jedoch denselben Namen für einen Punktstil, einen Linienstil und einen Textstil verwenden.

Symbol

Wählen Sie ein Symbol von der Symbol-Liste. Verwenden Sie das Symbol Editor-Programm, um ein Symbol anzusehen und zu bearbeiten.

Farbe

Wählen Sie eine Farbe für das Symbol. Wenn Sie Fenstertext wählen, wird der Stil unter Verwendung der Microsoft Fenstertext-Einstellung in Microsoft Windows angezeigt. Um die Windows Fenstertext-Einstellung zu bearbeiten, verwenden Sie die Systemsteuerung. Wenn der Fenstertext verwendet wird, wird der Stil beim Plotten auf die Voreinstellung Schwarz zurückgesetzt, wenn der voreingestellte Stil Legende gewählt ist. Um den voreingestellten Stil Legende zu wählen, wählen Sie Ansicht / Optionen / Register Vermessungslegende. Wenn Sie den Stil Schwarze Legende gewählt haben, kehrt der Stil zu Weiß als Voreinstellung zurück, wenn geplottet wird.

Einige Symboldefinitionen haben definierte Farben. Diese Farben werden festgelegt, wenn das Symbol im Symbol Editor-Programm erzeugt wird. Mit Hilfe des Symbol Editor-Programms kann z. B. die Farbe Grün für das Symbol ‘Busch’ definiert werden. Wenn Sie Symbole wählen, die Farbdefinitionen aufweisen, ist das Feld Farbe nicht verfügbar und zeigt ‘von Symbol’ an.

Durchmesser

Geben Sie den Durchmesser für das Symbol ein. Die Einheiten für das Feld Durchmesser ändern sich abhängig davon, ob die Option Dimensionen auf Papier oder Boden eingestellt ist. Bei einigen Symbolen, für die der Durchmesser nicht zutreffend ist (wie ein einzelner Pixel-Punkt), ist dieses Feld nicht verfügbar.

Papier	Wenn die Option Papier gewählt ist, steuert der Durchmesserwert des Symbols die Größe des Symbols auf dem Papier.

Wenn die Option Dimensionen z. B. auf Papier eingestellt ist, und Sie in das Feld Durchmesser die Zahl 5 eingeben, plottet Trimble Geomatics Office ein fünf Millimeter großes Symbol in einem metrischen Plot.
Die Einheiten, die Trimble Geomatics Office verwendet, sind die Koordinateneinheiten. Um die Koordinateneinheiten festzulegen, wählen Sie Datei / Projekteigenschaften / Register Einheiten und Format.

Die Darstellung der Papier-Einheiten auf dem Bildschirm wird unter Verwendung des Plot-Maßstabs berechnet. Um den Plot-Maßstab einzustellen, wählen Sie das Dialogfeld Datei / Blatt konfigurieren.

Boden	Wenn die Option Boden gewählt ist, ist der Durchmesserwert des Symbols die Größe auf dem Boden.

Wenn die Option Dimensionen z. B. auf Boden eingestellt ist, und Sie in das Feld Durchmesser die Zahl 5 eingeben, plottet Trimble Geomatics Office ein fünf Meter großes Symbol (oder ein fünf Fuß großes Symbol, abhängig von der Koordinateneinheiten-Einstellung). Dieses Ergebnis erscheint sowohl auf einem Plot als auch auf dem Bildschirm.
Um die Koordinateneinheiten festzulegen, wählen Sie Datei / Projekteigenschaften / Register Einheiten und Format.

Rotation

Verwenden Sie das Feld “Rotation”, um die Ausrichtung des Symbols zu steuern. Die Interpretation dieses Felds hängt von der Einstellung der Option Dimensionen ab.

Papier	Wenn die Option Papier gewählt ist, wird das Symbol beim Plotten immer relativ zur Seitenoberkante ausgerichtet.

Boden	Wenn die Option Boden gewählt ist, wird das Symbol relativ zu Norden geplottet.

Dimensionen

Klicken Sie auf Papier oder Boden, um die Operation der Felder Durchmesser und Rotation wie vorstehend beschrieben zu steuern.


    Dialogfeld Linienstil erzeugen/bearbeiten

Verwenden Sie dieses Dialogfeld, um einen Linienstil zu erzeugen oder zu bearbeiten.

So greifen Sie auf dieses Dialogfeld zu:

1.	Wählen Sie Bearbeiten / Stile von der Planansicht. Das Dialogfeld CAD-Stile erscheint.

2.	Führen Sie im Register Linienstile einen der folgenden Vorgänge aus:

  Klicken Sie auf Neu. Das Dialogfeld Linienstil erzeugen erscheint.

  Klicken Sie auf Bearbeiten. Das Dialogfeld Linienstil bearbeiten erscheint. (Die Schaltfläche Bearbeiten wird verfügbar, sobald Sie einen Stil wählen).

Name

Geben Sie den Namen eines neuen Linienstiles ein, oder benennen Sie einen bestehenden Linienstil um. Alle Linienstilnamen müssen eindeutig sein. Sie können jedoch denselben Namen für einen Linienstil, einen Punktstil und einen Textstil verwenden.

Einstellungen

Verwenden Sie die Gruppe Einstellungen, um das Erscheinungsbild des Stils zu definieren.

Linientypen

Wählen Sie den Linientyp für die Linie. Um einen Linientyp anzusehen und zu bearbeiten, verwenden Sie das Line Type Editor-Programm.

Farbe

Wählen Sie eine Farbe für den Linienstil. Wenn Sie Fenstertext wählen, wird der Stil unter Verwendung der Microsoft Windows Fenstertext-Einstellung angezeigt. Um die Windows-Einstellung zu bearbeiten, verwenden Sie die Systemsteuerung. Wenn Fenstertext verwendet wird, wird der Stil auf die Voreinstellung Schwarz zurückgesetzt, wenn geplottet wird, und der voreingestellte Stil Legende gewählt ist. Um den voreingestellten Stil Legende zu wählen, wählen Sie Ansicht / Optionen / Register Vermessungslegende. Wenn Sie den Stil Schwarze Legende gewählt haben, kehrt der Stil zu Weiß als Voreinstellung zurück, wenn geplottet wird.

Einige Linientypdefinitionen haben definierte Farben. Diese Farben werden festgelegt, wenn der Linientyp in dem Trimble Linientyp-Editor-Programm erzeugt wird. Mit Hilfe des Trimble Line Type Editor-Programms kann z. B. die Farbe Grün für den Linientyp ‘Hecke’ definiert werden. Wenn Sie Linientypen wählen, die Farbdefinitionen aufweisen, ist das Feld Farbe nicht verfügbar und zeigt ‘von Linientyp’ an.

Länge

Geben Sie die Länge der Musterwiederholung ein. Dieses Feld wird verfügbar, wenn der Linientyp ein wiederholbares Muster ist, wenn der Linienstil für eine Linie gewählt wird. Sie können z. B. eine ‘Zaunlinie’ als zu wiederholenden Typ wählen. Die folgende Abbildung zeigt dies:

Manche Linientypen haben eine festgelegte Länge (wie z. B. Tor). In diesem Fall ist das Feld Länge nicht  verfügbar.

Die Interpretation dieses Feldes ist abhängig von der Dimensionseinstellung. Die Einheiten für das Feld Länge ändern sich, abhängig davon, ob die Option Dimensionen auf Papier oder Boden eingestellt ist.

Papier	Wenn die Option Papier gewählt ist, ist der Längenwert auf Millimeter (mm) oder Zoll (in) eingestellt. (Die Einheiten sind von der Koordinateneinheiten-Einstellung abhängig. Um diese Einheiten festzulegen, wählen Sie Datei / Projekteigenschaften / Register Einheiten und Format).

Wenn die Option Dimensionen z. B. auf Papier eingestellt ist und die Zahl 5 in das Feld Länge eingegeben wird, wird eine Linie unter Verwendung einer fünf Millimeter (oder fünf Zoll) Musterwiederholung geplottet.

Die Darstellung der Papier-Einheiten auf dem Bildschirm wird unter Verwendung des Plot-Maßstabs berechnet. Um den Plot-Maßstab einzustellen, wählen Sie Datei / Blatt konfigurieren.

Boden	Wenn die Option Boden gewählt ist, ist der Längenwert der für die Koordinateneinheiten eingestellte Bodenwert. Um diese Einheiten festzulegen, wählen Sie Datei / Projekteigenschaften / Register Einheiten und Format.

Wenn die Option Dimensionen z. B. auf Boden eingestellt ist, resultiert die Eingabe der Zahl 5 in das Feld Länge (sowohl auf dem Plot als auch auf dem Bildschirm) in einer Linie unter Verwendung einer fünf Meter (oder fünf Fuß) Musterwiederholung.

Breite

Geben Sie die Breite der Linie ein. Bei einigen Linientypen (z. B. Durchgehend) ist die Breite nicht zutreffend und das Feld wird nicht verfügbar. Die folgende Abbildung zeigt, wie das Feld Breite angewendet wird:

Die Interpretation dieses Felds hängt von der Einstellung der Dimensionen ab.

Papier	Wenn die Option Dimensionen auf Papier eingestellt ist, ist der Linientyp auf Millimeter oder Zoll eingestellt. (Die Einheiten sind von der Koordinateneinheiten-Einstellung abhängig. Um diese Einheiten festzulegen, wählen Sie Datei / Projekteigenschaften / Register Einheiten und Format.)

Boden	Wenn die Option Dimensionen auf Boden eingestellt ist, ist der Linientypwert der Bodenwert, der für die Koordinateneinheiten in Datei / Projekteigenschaften / Register Einheiten und Format eingestellt wurde.

Dimensionen

Klicken Sie auf Papier oder Boden, um die Wirkung der Felder Länge und Breite wie vorstehend beschrieben zu kontrollieren.


    Dialogfeld Textstil erzeugen/bearbeiten

Verwenden Sie das Dialogfeld Textstil erzeugen/bearbeiten, um einen Textstil zu erzeugen oder zu bearbeiten.

So greifen Sie auf dieses Dialogfeld zu:

1.	Wählen Sie Bearbeiten / Stile von der Planansicht. Das Dialogfeld CAD-Stile erscheint.

2.	Wählen Sie das Register Textstile.

3.	Führen Sie einen der folgenden Vorgänge aus:

  Klicken Sie auf Neu. Das Dialogfeld Textstil erzeugen erscheint.

  Klicken Sie auf Bearbeiten. Das Dialogfeld Textstil bearbeiten erscheint. (Die Schaltfläche Bearbeiten wird verfügbar, sobald Sie einen Stil wählen.)

Name

Geben Sie den Namen eines neuen Textstils ein, oder benennen Sie den aktuellen Namen des Textstils um. Alle Textstilnamen müssen eindeutig sein. Sie können jedoch denselben Namen für einen Textstil, einen Linienstil und einen Punktstil verwenden.

Schriftart

Wählen Sie die Schriftart für den Textstil.

Die Schriftartbezeichnungen, die in der Liste angezeigt werden, sind die Schriftarten, die in Ihrem Microsoft Windows-System verfügbar sind.

Farbe

Wählen Sie die Farbe des Textes aus. Wenn Sie keine Farbe wählen, ist die Fenstertext-Einstellung in Microsoft Windows die Voreinstellung. Um die Windows Fenstertext-Einstellung zu bearbeiten, verwenden Sie die Systemsteuerung. Wenn Fenstertext verwendet wird, wird der Stil auf die Voreinstellung Schwarz zurückgesetzt, wenn geplottet wird, und der voreingestellte Stil Legende gewählt ist. Um den voreingestellten Stil Legende zu wählen, wählen Sie Ansicht / Optionen / Register Vermessungslegende. Wenn Sie den Stil Schwarze Legende gewählt haben, kehrt der Stil auf dem Bildschirm zu Weiß als Voreinstellung zurück.

Höhe

Geben Sie die Höhe des Textstils ein.

Die Interpretation dieses Feldes ist abhängig von der Dimensionseinstellung.

Papier	Wenn die Option Papier gewählt ist, ist der Höhenwert auf Millimeter (mm) oder Zoll (in) eingestellt. (Die Einheiten sind von den Koordinateneinheiten abhängig, die in Datei / Projekteigenschaften / Register Einheiten und Format festgelegt wurden.)

Wenn die Option z. B. auf Papier eingestellt ist, erzeugt die Eingabe der Zahl 5 in das Feld Höhe eine 5 mm Texthöhe auf einem metrischen Plot. Die Darstellung der Papier-Einheiten auf dem Bildschirm wird unter Verwendung des spezifischen Plot-Maßstabs im Dialogfeld Datei / Blatt konfigurieren berechnet.

Boden	Wenn die Option Boden gewählt ist, ist der Höhenwert der für die Koordinateneinheiten in Datei / Projekteigenschaften / Register Einheiten und Format eingestellte Bodenwert.

Wenn die Option z. B. auf Boden eingestellt ist, resultiert die Eingabe der Zahl 5 in das Feld Höhe (sowohl auf dem Plot als auch auf dem Bildschirm) in der Anzeige eines fünf Meter hohen Texts auf einem metrischen Plot.

Schriftstil

Wählen Sie die Kontrollkästchen Fett, Kursiv oder Unterstrichen, um den gewünschten Texteffekt zu erzeugen.

Dimensionen

Klicken Sie auf Papier oder Boden, um die Wirkung des Felds Höhe wie vorstehend beschrieben zu kontrollieren.


    Befehl Layer

Verwenden Sie diesen Befehl, um Layer für das aktuelle Projekt zu verwalten.

So greifen Sie darauf zu:

  Wählen Sie Bearbeiten / Layer.

Das Dialogfeld Layer erscheint.


    Dialogfeld Layer

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um Layer für das aktuelle Projekt zu verwalten.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Layer.

  Klicken Sie auf das Symbol Layer [image].

  Betätigen Sie Strg+L.

Der aktuelle Layer wird ganz oben im Dialogfeld angezeigt.

Name

Geben Sie einen Namen für den Layer ein. Der Name muß einmalig sein. Wenn Sie den Namen eines Layers ändern, der Elemente enthält, werden die Elemente in den neuen Layer verschoben.

Punktstil

Wählen Sie einen Punktstil von der Liste. Die Einträge in der Liste sind von Trimble vordefinierte Stile und neue Punktstile, die Sie in Trimble Geomatics Office (unter Verwendung von Bearbeiten / Stile) oder während der Kartiercode-Verarbeitung erzeugt haben. (Weitere Informationen finden Sie in der Hilfe des Feature and Attribute Editor-Programms).

Dieser Punktstil wird für alle Punkte in diesem Layer verwendet, für die der Punktstil <Nach Layer> eingestellt wurde.

Linienstil

Wählen Sie einen Linienstil von der Liste. Die Einträge in der Liste sind von Trimble vordefinierte Stile und neue Linienstile, die Sie in Trimble Geomatics Office (unter Verwendung von Bearbeiten / Stile) oder während der Kartiercode-Verarbeitung erzeugt haben. (Weitere Informationen finden Sie in der Hilfe des Feature and Attribute Editor-Programms).

Dieser Linienstil wird für alle Linien in diesem Layer verwendet, für die der Linienstil <Nach Layer> eingestellt wurde.

Textstil

Wählen Sie einen Textstil von der Liste. Die Einträge in der Liste sind von Trimble vordefinierte Stile und allen neuen Textstile, die Sie in Trimble Geomatics Office (unter Verwendung von Bearbeiten / Stile) erzeugt haben.

Dieser Textstil wird für alle Textpassagen und Anmerkungen in diesem Layer verwendet, für die der Textstil <Nach Layer> eingestellt wurde.

Gesperrt

Heben Sie die Markierung in diesem Kontrollkästchen auf, damit Elemente in dem Layer im Trimble Geomatics Office-Graphikfenster gewählt werden können. Falls Sie nicht möchten, daß Elemente in diesem Layer gewählt werden können, aktivieren Sie dieses Kontrollkästchen. Der Wert dieses Feldes wird in dem Symbol Layer-Auswahl in der Layer-Symbolleiste angezeigt.

Wenn der Layer gesperrt ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Wenn der Layer nicht gesperrt ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Wenn das Feld Gesperrt bei einem oder mehreren Layer gewählt ist, erscheint das Symbol [image] in der Statusleiste.

HINWEIS: Wenn Sie dieses Kontrollkästchen wählen, können Sie die Elemente in dem Layer nicht mit einer der folgenden Methoden ansehen:

  im Eigenschaftsfenster

  diese durch Klicken auswählen

  mit einem der Befehle im Menü Wählen auswählen

Sichtbar

Wählen Sie dieses Kontrollkästchen, um Elemente in dem Layer im Graphikfenster anzusehen. Der Wert dieses Feldes wird in dem Symbol Layer-Auswahl in der Layer-Symbolleiste angezeigt.

Wenn der Layer sichtbar ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Wenn der Layer nicht sichtbar ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Heben Sie die Markierung in diesem Kontrollkästchen auf, um Elemente in dem Layer auszublenden.

HINWEIS: Wenn Sie die Markierung in diesem Kontrollkästchen aufheben, können Sie die Elemente in dem Layer in dem Trimble Geomatics Office-Graphikfenster nicht sehen.

Das Symbol Ausgeblendete Layer [image] erscheint in der Statusleiste, wenn ein oder mehrere Layer ausgeblendet sind. Das bedeutet, daß dieses Symbol in der Statusleiste erscheint, wenn bei einem oder mehreren Layer die Eigenschaft Sichtbar aufgehoben wurde.

ACHTUNG: Wenn ein Layer nicht sichtbar ist, können Sie keine Elemente von diesem Layer ansehen oder auswählen. Dies trifft zu, wenn der Layer gesperrt oder nicht gesperrt ist. Das heißt, die Option Sichtbar deaktiviert die Option Gesperrt.

Neu

Klicken Sie auf Neu, um einen neuen Layer zu dem Projekt hinzuzufügen. Eine neue Reihe wird in dem Dialogfeld Layer hinzugefügt. Geben Sie Werte für jede Spalte in den neuen Layer ein.

Löschen

Klicken Sie auf Löschen, um den gerade hervorgehobenen Layer zu löschen. Wenn Sie einen Layer löschen, der Elemente enthält, erscheint ein Warndialogfeld. Dieses Dialogfeld warnt Sie, daß die Elemente in diesem Layer gelöscht werden, wenn Sie den Layer löschen.

Aktuell

Klicken Sie auf Aktuell, um den gewählten Layer zum aktuellen Layer zu machen. Der aktuelle Layer wird hervorgehoben. Der aktuelle Layer ist der Layer, zu dem neue Elemente hinzugefügt werden. Alle Elemente (Punkte, Linien, Bögen, Kurven, Text und Anmerkungen), die ohne Layer-Namen zu der Datenbank hinzugefügt wurden, werden zu dem aktuellen Layer hinzugefügt.

TIP: Sie können mehrere Einträge im Dialogfeld Layer bearbeiten:

1.	Verwenden Sie die Taste Strg, um mehrere Einträge zu wählen.

2.	Bearbeiten Sie das zuletzt hervorgehobene Feld. Alle hervorgehobenen Einträge werden aktualisiert.


Layer - Überblick
    Layer − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Überblick

In der Planansicht gehört jedes Element in dem Projekt zu einem Layer. Ein Layer besteht aus einem Namen, Punktstil, Linienstil und Textstil. Die Organisation von Daten in Layern erleichtert die Datenverwaltung. Dies ist von Nutzen, wenn umfangreiche Datensätze verwaltet werden. Zum Beispiel können alle Punkte mit dem Kartiercode ‘Baum’ in einem Layer namens ‘Bäume’ gruppiert werden. Für alle Elemente wird der voreingestellte Layer verwendet, es sei denn, Sie haben neue Layer in dem Projekt erzeugt.

Alle Elemente (Punkte, Linien, Bögen, Kurven, Text und Anmerkungen) haben ein Layer-Feld. Verwenden Sie das Eigenschaftsfenster, um Elemente anzusehen. Verwenden Sie eine der folgenden Methoden, um den Layer für ein Element zu wählen:

  Wenn Sie ein Element zu dem Projekt hinzufügen, wählen Sie den Layer im Feld Layer im entsprechenden Dialogfeld.

  Importieren Sie eine Datei mit gewünschten Layer.

  Verwenden Sie die Kartiercode-Verarbeitung.

 Verwenden Sie das Eigenschaftsfenster, um den Layer für bestehende Elemente im Projekt zu wählen

Verwenden Sie das Dialogfeld Layer, um die Layer für das Projekt zu verwalten

Verwenden Sie die Symbolleiste Layer-Auswahl, um festzulegen, welche Layer Sie sehen und auswählen können. So wählen Sie Elemente in einem gewählten Layer aus:

  Wählen Sie Wählen / Nach Layer.

Wenn bei einem Punkt in der Datenbank <Nach Layer> im Feld Punktstil gewählt ist, wird dem Punkt der für den Layer festgelegte Punktstil zugeordnet. Wenn bei einer Linie, Kurve oder einem Bogen <Nach Layer> in dem Feld Linienstil gewählt ist, wird der Linie, Kurve oder dem Bogen der für den Layer festgelegte Linienstil zugeordnet. Ebenso wird, wenn bei einer Textpassage oder Anmerkung <Nach Layer> in dem Feld Textstil gewählt ist, dem Text oder der Anmerkung der für den Layer festgelegte Textstil zugeordnet.


Doppelte Punkte - Überblick
Doppelte Punkte  − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld
Überblick

Trimble Geomatics Office bietet zwei Optionen für das Importieren von Punkten mit demselben Namen:

1.	Doppelte Punkte immer kombinieren

2.	Doppelte Punkte innerhalb der Toleranz kombinieren. Sie können angeben, innerhalb welcher horizontaler oder vertikaler Toleranz die Software Punkte kombinieren soll oder daß die Software beim Importieren überhaupt keine doppelten Punkte auflöst.

Als Voreinstellung kombiniert Trimble Geomatics Office beim Importieren Punkte gleichen Namens, so daß keine doppelten Punkte erzeugt werden. (Dies ist die schnellste Methode, um Daten zu importieren.)

Wenn Sie keine doppelten Punkte kombinieren, werden doppelte Punkte erzeugt, wenn Sie eine oder mehrere Dateien importieren, die Beobachtungen oder Koordinaten außerhalb der Toleranz für denselben Punkt enthalten. Wenn Sie zum Beispiel:

  eine Datei importieren, die einen Punkt mit demselben Namen wie ein bestehender Punkt in der Datenbank enthält, und sie sich nicht innerhalb der Toleranz befinden

  Punkte mit demselben Namen aus verschiedenen Survey Controller-(*.dc)-Dateien importieren

Falls notwendig, können Sie auch Punkte kombinieren, die sich innerhalb der Software befinden, indem Sie den Befehl Doppelte Punkte kombinieren verwenden.

Wie Trimble Geomatics Office Punkte kombiniert

Ein Punkt kann nur eine vom Benutzer eingegebene WGS-84-Koordinate und eine vom Benutzer eingegebene Gitter-/örtliche Koordinate haben. Trimble Geomatics Office wählt aus, welche bestehenden WGS-84- oder Gitter-/örtlichen Koordinaten überschrieben werden, wobei folgende Regeln befolgt werden:

1.	Die Koordinaten mit der höchsten Qualität werden verwendet.

2.	Die letzte in die Datenbank eingegebene Koordinatenkomponente wird verwendet.

Der Punktableitungsbericht enthält Einzelheiten über die Vermessungsdaten, die zur Koordinierung der Punkte verwendet wurden. Der Import-Bericht enthält alle Koordinatenkomponenten, die überschrieben oder verworfen wurden.

HINWEIS: Wenn die Software eine Koordinate überschreibt, die Sie verwenden möchten, müssen Sie das Importieren rückgängig machen, die Importdatei bearbeiten (oder den Punktnamen im Trimble Geomatics Office-Projekt) und die Daten erneut importieren. Alternativ hierzu machen Sie das Importieren rückgängig, und importieren Sie die Daten erneut unter Verwendung der Option Doppelte Punkte innerhalb der Toleranz kombinieren im Dialogfeld Optionen doppelte Punkte. Sie können dann einfach innerhalb Trimble Geomatics Office die doppelten Punkte umbenennen.


Dialogfeld Optionen doppelte Punkte

Weitere Informationen

Wie kann ich ...	Siehe auch

Verwenden Sie das Dialogfeld Optionen doppelte Punkte, um anzugeben, wie Trimble Geomatics Office Punkte mit demselben Namen behandeln soll, wenn sie in ein Projekt importiert werden.

Die Einstellungen in diesem Dialogfeld gelten für alle Importoptionen; egal ob Sie Dateien unter Verwendung der Projektleiste importieren oder Dateien per Drag-and-Drop in ein Trimble Geomatics Office-Projekt einbinden, die Software verwendet die letzte von Ihnen im Dialogfeld Optionen doppelte Punkte festgelegte Einstellung. Sie können eine Vorlage erzeugen, um die Optionen für doppelte Punkte einzustellen.

So rufen Sie das Dialogfeld Optionen doppelte Punkte auf:

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Klicken Sie auf Optionen.

Die folgenden Abschnitte beschreiben die verfügbaren Optionen.

Doppelte Punkte immer kombinieren

Diese Option ist als Voreinstellung gewählt. Die Software kombiniert Punkte mit demselben Namen beim Importieren, es werden also keine doppelten Punkte erzeugt. Nach dem Importieren werden im Import-Bericht alle überschriebenen oder verworfenen Koordinatenkomponenten aufgelistet.

HINWEIS: Wenn die Software eine Koordinate überschreibt, die Sie verwenden möchten, müssen Sie das Importieren rückgängig machen, die Importdatei bearbeiten (oder den Punktnamen im Trimble Geomatics Office-Projekt) und die Daten erneut importieren. Alternativ hierzu machen Sie das Importieren rückgängig, und importieren Sie die Daten erneut unter Verwendung der Option Doppelte Punkte innerhalb der Toleranz kombinieren im Dialogfeld Optionen doppelte Punkte. Sie können dann einfach in Trimble Geomatics Office die doppelten Punkte umbenennen.

Doppelte Punkte innerhalb der Toleranz kombinieren

Wenn Sie diese Option wählen, werden alle Vermessungsdaten für einen Punkt unter demselben Punkt abgelegt, wenn sie sich innerhalb der festgelegten horizontalen und/oder vertikalen Toleranz befinden. Die voreingestellte Toleranz wird aus der im Register Neu berechnen des Dialogfeldes Projekteigenschaften angegebenen unbekannten horizontalen und vertikalen Toleranz bestimmt. Nach dem Importieren listet der Import-Bericht alle überschriebenen oder verworfenen Koordinaten auf.

Sie können diese Option verwenden, um festzulegen, daß die Software doppelte Punkte beim Importieren nicht kombinieren soll. Setzen Sie hierzu die Toleranz für das Importieren von Daten auf 0,02 (die horizontale Toleranz für Vermessungsqualität) und 0,050 (die vertikale Toleranz für Vermessungsqualität). Sie können dann in Trimble Geomatics Office einfach die doppelten Punkte umbenennen. Wenn sowohl die horizontale als auch die vertikale Toleranz angegeben wurden, müssen beide Toleranzwerte erfüllt werden, damit doppelte Punkte kombiniert werden können. Wenn keine Toleranz angegeben wurde (d. h. die Kontrollkästchen Horizontal und Vertikal in der Gruppe Toleranzen nicht gewählt wurden), werden die doppelten Punkte kombiniert.

HINWEIS: Beim Importieren von digitalen Nivellierdaten wird nur die vertikale Toleranz verwendet.

HINWEIS: Wenn die Toleranz auf 0,000 eingestellt ist, müssen die Koordinaten der doppelten Punkte identisch sein, damit diese Punkte kombiniert werden können.


Befehl Punkte auseinanderziehen

Verwenden Sie diesen Befehl, um aus einem Punkt mehrere Punkte zu erzeugen, indem Sie Daten trennen:

  nach Datenquelle

  nach allen Beobachtungen

  nach Datentyp (GPS/Terrestrisch)

Wählen Sie Bearbeiten / Punkte auseinanderziehen, um auf diesen Befehl zuzugreifen.

Das Dialogfeld Punkte auseinanderziehen erscheint.

Verwenden Sie die Option Punkte auseinanderziehen, um:

  doppelte Punkte aufzulösen

  Positionen für alle Beobachtungen zu berechnen

  eine Kalibrierung in Trimble Geomatics Office durchzuführen, wenn sich GPS-Daten und Gitter-/örtliche Daten unter demselben Punkt befinden

 terrestrische und GPS-Beobachtungen zu trennen


Dialogfeld Punkte auseinanderziehen

Ein Punkt kann Vermessungsdaten aus mehr als einer Datenquelle aufweisen. Die Datenquelle kann außerdem mehr als eine Beobachtung enthalten. Es wird jedoch nur eine Beobachtung verwendet, um die berechnete Position des Punktes abzuleiten.

Sie können die Option Punkte auseinanderziehen verwenden, um Punkte zu erzeugen, indem die Daten nach Datenquelle, allen Beobachtungen oder Datentyp (GPS/Terrestrisch) getrennt werden. Ziehen Sie Punkte auseinander, um:

  doppelte Punkte aufzulösen

  Positionen für alle Beobachtungen zu berechnen

  eine GPS-Kalibrierung in Trimble Geomatics Office durchzuführen, wenn sich GPS-Daten und Gitter-/örtliche Daten unter demselben Punkt befinden

  terrestrische und GPS-Beobachtungen zu trennen

Wenn Sie Punkte auseinanderziehen, werden Punkte mit demselben Namen erzeugt.

Sie importieren z. B. zwei Survey Controller (*.dc)-Dateien in dasselbe Projekt:

  Die erste .dc-Datei enthält eine konventionelle Beobachtung zu dem Punkt ‘101’.

  Die zweite .dc-Datei enthält eine eingegebene Koordinate und eine GPS-Beobachtung zu demselben Punkt ‘101’.

Wenn die erste Datei importiert wird, wird ein einzelner Punkt ‘101’ in dem Projekt erzeugt, und die Beobachtung wird verwendet, um die Position des Punktes abzuleiten. Wenn die zweite Datei importiert wird, vergleicht Trimble Geomatics Office die eingegebene Koordinate in der .dc-Datei mit der Position des Punktes im Projekt. Da die Vermessungsdaten in der .dc-Datei für denselben Punkt ‘101’ bestimmt wurden, werden der Punkt aus dem Projekt und die .dc-Datei automatisch kombiniert. Die Vermessungsdaten stammen daher aus zwei Quellen: der ersten und zweiten Survey Controller (*.dc)-Datei. Es gibt drei Sätze von Koordinatenquellen für den Punkt:

  Konventionelle Beobachtung

  Eingegebene Koordinate

  GPS-Besetzung

TIP: Sie können die Datenquelle und den Beobachtungs- sowie Koordinateninhalt eines Punktes im Menü Seite des Eigenschaftsfensters ansehen.

Sie können nur Punkte auseinanderziehen, wenn sich ein Punkt in der aktuellen Auswahlmenge befindet, der mehrfache Beobachtungen oder Koordinaten enthält.

Wählen Sie Bearbeiten / Punkte auseinanderziehen, um auf das Dialogfeld Punkte auseinanderziehen zuzugreifen.

Auseinanderziehen

Die Software verwendet eine der folgenden Methoden, um Punkte auseinanderzuziehen:

Nach Datenquelle	z. B. eine .dc-Datei.
Alle Beobachtungen	Getrennte Koordinaten werden für alle Punktbeobachtungen und Punktkoordinaten erzeugt.
Nach Datentyp	Erzeugt Punkte, indem Daten nach Datentyp getrennt werden.  Alle GPS-Beobachtungen und WGS-84-Koordinaten werden unter einem Punkt abgelegt. Alle Gitternetz-Koordinaten und terrestrischen Beobachtungen befinden sich unter einem anderen Punkt.
HINWEIS: Wenn Sie eine GPS-Kalibrierung in Trimble Geomatics Office durchführen müssen, und die GPS-Beobachtungen und Gitter-Koordinaten unter demselben Punkt gespeichert sind, verwenden Sie die Option Punkte nach Datentyp auseinanderziehen. Dadurch werden zwei Punkte erstellt, ein Gitter-Punkt und ein GPS-Punkt. Sie können dann eine GPS-Kalibrierung mit diesen Punkten durchführen.

GPS-Punkte mit diesem Suffix umbenennen (_GPS)

Wenn Sie die Option Nach Datentyp wählen, wird die Option GPS-Punkte mit diesem Suffix umbenennen verfügbar. Sie können den Punkten eindeutige Namen zuordnen, indem Sie das Suffix wählen, das zu den GPS-Punkten hinzugefügt werden soll. Wenn Sie diese Option nicht wählen, werden Punkte nach Datentyp auseinandergezogen, und alle Punkte haben denselben Namen.

Statistik auseinandergezogener Punkte anzeigen

Klicken Sie auf Details, um die Anzahl der Punkte anzuzeigen, die beim Auseinanderziehen aus den gewählten Punkten erzeugt werden können.


Befehl Mehrfachbearbeitung

 Siehe auch

Verwenden Sie diesen Befehl, um die vermessungsbezogenen oder CAD-bezogenen Eigenschaften von Elementen in der Auswahlmenge zu bearbeiten. Dieser Befehl ist nur verfügbar, wenn Sie über eine aktuelle Auswahlmenge verfügen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Mehrfachbearbeitung.

  Wählen Sie Mehrfachbearbeitung aus dem Verknüpfungsmenü.

Das Dialogfeld Mehrfachbearbeitung (Register Vermessung oder Register CAD) erscheint.


Dialogfeld Mehrfachbearbeitung - Register Vermessung
Dialogfeld Mehrfachbearbeitung − Register Vermessung

Verwenden Sie dieses Dialogfeld, um die vermessungsbezogenen Eigenschaften mehrerer Elemente zu bearbeiten. Sie können z. B. die Antennenhöhen für die Besetzungen einer Gruppe von GPS-Punkten korrigieren, wenn Sie wissen, daß diese im Feld nicht korrekt eingegeben wurden.

Führen Sie einen der folgenden Vorgänge aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Mehrfachbearbeitung.

  Wählen Sie Mehrfachbearbeitung aus dem Verknüpfungsmenü.

HINWEIS: Die Gültigkeit der Auswahl-Option wird geprüft, wenn Sie eine Auswahl treffen. Wenn eine Option keine gültige Option für die aktuelle Auswahl ist, steht sie nicht zur Verfügung.

Diese Bearbeitungen an den ausgewählten Punkten vornehmen

Diese Gruppe enthält die vermessungsbezogenen Eigenschaften, die Sie für gewählte Punkte bearbeiten können.

Antennenhöhe setzen auf

Wählen Sie dieses Kontrollkästchen, um die folgenden Felder zu aktivieren. Verwenden Sie diese Felder, um die Antennenhöhe der Besetzungen des Punktes zu ändern.

Alle Höhen ändern mit Wert	Wählen Sie den Antennenhöhenwert der Punkte, die Sie ändern möchten. Die Liste enthält die für die gewählten Punkte eingegebenen Höhen. Nur die Antennenhöhen mit dem gewählten Wert werden geändert.
Neue Antennenhöhe	Geben Sie den korrekten Antennenhöhenwert ein, der angewendet werden soll.

GPS-Antennendetails setzen auf

Wählen Sie dieses Kontrollkästchen, um die folgenden Felder zu aktivieren. Verwenden Sie diese Felder, um den Antennentyp und/oder die Meßmethode der gewählten Punkte zu ändern.

Antennentyp	Wählen Sie den Antennentyp für die Punkte, die Sie ändern möchten.
Gemessen bis	Wählen Sie die Meßmethode für die Punkte, die Sie ändern möchten. Die Liste in diesem Feld ist von dem von Ihnen gewählten Antennentyp abhängig. Wenn ein neuer Antennentyp gewählt wird, wird der Inhalt dieses Felds gelöscht.

Konventionelle Zieldetails setzen auf

Wählen Sie dieses Kontrollkästchen, um die folgenden Felder zu aktivieren. Verwenden Sie diese Felder, um die Zielhöhen und Prismen-Konstanten der gewählten Punkte zu ändern.

Zielhöhe	Geben Sie die korrekte Zielhöhe ein, die angewendet werden soll.
Prismen-Konstante	Geben Sie die korrekte Prismen-Konstante ein, die angewendet werden soll.

Laser-Zielhöhe festlegen

Wählen Sie dieses Kontrollkästchen, um dieses Feld zu aktivieren. Geben Sie die korrekte Zielhöhe ein, die angewendet werden soll.

Diese Bearbeitungen an den ausgewählten Beobachtungen vornehmen

Diese Gruppe enthält die vermessungsbezogenen Eigenschaften, die Sie für die gewählten Beobachtungen (GPS, Konventionell, Laser) bearbeiten können.

Bei der Netzausgleichung verwenden

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Verwenden Sie dieses Feld, um die gewählten Beobachtungen in einer Netzausgleichung (wenn das Netzausgleichungsmodul installiert ist) zu verwenden (oder auszuschließen).

Diese Einstellung trifft nur für GPS-Beobachtungen zu, die über Kovarianzinformationen (QC2) verfügen. Wenn diese Option auf Nein eingestellt ist, werden die Beobachtungen für eine Netzausgleichung deaktiviert. Sie werden jedoch immer noch bei der Neuberechnung verwendet, um die Positionen von Punkten zu bestimmen.

Beobachtungsstatus setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Verwenden Sie dieses Feld, um eine Beobachtung bei der Neuberechnung zu aktivieren oder zu deaktivieren oder um die Beobachtungen als Prüfpunkt zu aktivieren.

Wenn die Beobachtungen deaktiviert sind, werden sie bei der Neuberechnung nicht verwendet, und es wird über alle unvollständigen Abschlüsse dieser Beobachtungen berichtet. Wenn Sie die Beobachtungen als Prüfpunkt aktivieren, werden die Beobachtungen zur Punktkoordinierung verwendet, wenn keine anderen aktivierten Beobachtungen oder Koordinaten verfügbar sind.

Kennzeichnungstyp unterdrücken

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie die Warnkennzeichnungstypen, die Sie in der Vermessungsansicht unterdrücken möchten. Warnkennzeichnungstypen erscheinen erneut, wenn eine Neuberechnung durchgeführt wird.

HINWEIS: Wenn Sie ein Kontrollkästchen wählen, um ein bestimmtes Feld zu bearbeiten, führt Trimble Geomatics Office eine Überprüfung der gewählten Elemente durch. Falls diese Überprüfung ergibt, daß die Felder für die gewählten Elemente nicht verwendet werden, werden die Kontrollkästchen-Option(en) deaktiviert.


Dialogfeld Mehrfachbearbeitung - Register CAD
Dialogfeld Mehrfachbearbeitung − Register CAD

Verwenden Sie dieses Dialogfeld, um die CAD-bezogenen Eigenschaften der Elemente in der Auswahl zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Mehrfachbearbeitung.

  Wählen Sie Mehrfachbearbeitung aus dem Verknüpfungsmenü.

Diese Bearbeitungen an den ausgewählten Punkten vornehmen

Diese Gruppe enthält die CAD-bezogenen Eigenschaften, die Sie für gewählte Punkte bearbeiten können.

Kartiercode setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Geben Sie den Kartiercodewert ein, der auf die gewählten Punkte angewendet werden soll.

Layer setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie den Layer, der den gewählten Punkten zugeordnet werden soll. Wenn Sie einen Layer eingeben, der nicht existiert, erscheint das Dialogfeld Neuer Layer.

Punktstil setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie den Punktstil, der auf die gewählten Punkte angewendet werden soll. Wenn Sie einen Punktstil eingeben, der nicht existiert, erscheint das Dialogfeld Punktstil erzeugen.

Alle Anmerkungen entfernen

Wählen Sie dieses Kontrollkästchen, um alle den gewählten Punkten zugeordneten Anmerkungen zu entfernen.

Diese Bearbeitungen am ausgewählten Liniennetz vornehmen

Diese Gruppe enthält die CAD-bezogenen Eigenschaften, die Sie für das ausgewählte Liniennetz (Linien, Kurven, Bogen) bearbeiten können.

Layer setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie den Layer, der dem ausgewählten Liniennetz zugeordnet werden soll. Wenn Sie einen Layer eingeben, der nicht existiert, erscheint das Dialogfeld Neuer Layer.

Linienstil setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie den Linienstil, der auf das ausgewählte Liniennetz angewendet werden soll. Wenn Sie einen Linienstil eingeben, der nicht existiert, erscheint das Dialogfeld Linienstil erzeugen.

Alle Anmerkungen entfernen

Wählen Sie dieses Kontrollkästchen, um alle dem ausgewählten Liniennetz zugeordneten Anmerkungen zu entfernen.

Diese Bearbeitungen am ausgewählten Text vornehmen

Diese Gruppe enthält die Felder, die Sie für den gewählten Text bearbeiten können.

Layer setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie den Layer der dem gewählten Text zugeordnet werden soll. Wenn Sie einen Layer eingeben, der nicht existiert, erscheint das Dialogfeld Neuer Layer.

Textstil setzen auf

Wählen Sie dieses Kontrollkästchen, um das Feld zu aktivieren. Wählen Sie den Textstil, der auf den gewählten Text angewendet werden soll. Wenn Sie einen Textstil eingeben, der nicht existiert, erscheint das Dialogfeld Textstil erzeugen.


 Befehl Beobachtungen aktivieren/deaktivieren

Verwenden Sie diesen Befehl, um eine Beobachtung zu aktivieren oder zu deaktivieren. Die Deaktivierung einer Beobachtung bewirkt, daß diese nicht für Vermessungsberechnungen verwendet werden kann.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Bearbeiten / Beobachtung aktivieren/deaktivieren.

  Verwenden Sie das Status-Feld einer Beobachtung im Eigenschaftsfenster.

  Verwenden Sie das Feld Beobachtungsstatus setzen auf im Dialogfeld Mehrfachbearbeitung / Register Vermessung.

HINWEIS: Bei einer Neuberechnung wird der Status der Beobachtungen bei der Berechnung einer Punktposition berücksichtigt. Sie können die Funktion Beobachtungen aktivieren/deaktivieren verwenden, um den Status einer Beobachtung zu deaktivieren, so daß diese aus der Neuberechnung entfernt wird.

Sie können den Status einer Beobachtung nur ändern, wenn:

   es eine aktuelle Auswahlmenge gibt und

   alle Beobachtungen in der Auswahlmenge denselben Beobachtungsstatus haben.

HINWEIS: Sie können den Status mehrerer Beobachtungen festlegen, wenn in der aktuellen Auswahlmenge mehr als eine Beobachtung enthalten ist.

Wenn Sie eine Beobachtung deaktivieren, wird die Farbe der Beobachtungslinie dunkelrot.

HINWEIS: Wenn es mehrfache Beobachtungen entlang derselben Linie gibt, wird die Beobachtung nur dann in rot angezeigt, wenn alle Beobachtungen deaktiviert sind.


 Befehl Beobachtungsfluß umkehren

Basislinien werden in der Richtung angewendet, in der sie beobachtet wurden. Verwenden Sie diesen Befehl, um die Richtung einer Beobachtung umzukehren und zu erzwingen, daß diese in der entgegengesetzten Richtung angewendet wird.

So greifen Sie darauf zu:

  Wählen Sie Bearbeiten / Beobachtungsfluß umkehren.

Wenn Sie die Richtung der Beobachtung umkehren, können sich die berechneten Koordinaten und Qualitäten für einen Punkt ändern. Die Neuberechnungsfunktion muß verwendet werden, um die Beobachtung anzuwenden und neue Punktpositionen zu berechnen.

ACHTUNG: Wenn der Punkt, von dem der Beobachtungsfluß ausgehen soll, nicht über eine bekannte Position verfügt (z. B. ein RTK-Punkt), wird die Beobachtung nicht angewendet.


Dialogfeld Neuer Layer

Verwenden Sie dieses Dialogfeld, um einen neuen Layer zu erzeugen. Dieses Dialogfeld erscheint, wenn Sie beim Einfügen oder Bearbeiten von Elementen (Punkte, Linien, Kurven, Bogen, Text) einen Layer-Namen eingeben, der nicht existiert.

Der aktuelle Layer wird ganz oben im Dialogfeld angezeigt.

Name

Geben Sie einen Namen für den Layer ein, zu dem das/die gewählte(n) Element(e) verschoben werden sollen.

Punktstil

Wählen Sie einen Punktstil von der Liste. Die Einträge in der Liste sind von Trimble vordefinierte Stile und neue Punktstile, die Sie in Trimble Geomatics Office (unter Verwendung von Bearbeiten / Stile) oder während der Kartiercode-Verarbeitung erzeugt haben.

Weitere Informationen finden Sie in der Hilfe des Feature and Attribute Editor-Programms.

Dieser Punktstil wird für alle Punkte in diesem Layer verwendet, für die der Punktstil <Nach Layer> eingestellt wurde.

Linienstil

Wählen Sie einen Linienstil von der Liste. Die Einträge in der Liste sind von Trimble vordefinierte Stile und neue Linienstile, die Sie in Trimble Geomatics Office (unter Verwendung von Bearbeiten / Stile) oder während der Kartiercode-Verarbeitung erzeugt haben.

Dieser Linienstil wird für alle Linien in diesem Layer verwendet, für die der Linienstil <Nach Layer> eingestellt wurde.

Textstil

Wählen Sie einen Textstil von der Liste. Die Einträge in der Liste sind von Trimble vordefinierte Stile und alle neuen Textstile, die Sie in Trimble Geomatics Office (unter Verwendung von Bearbeiten / Stile) erzeugt haben.

Dieser Textstil wird für alle Textpassagen und Anmerkungen in diesem Layer verwendet, für die der Textstil <Nach Layer> eingestellt wurde.

Gesperrt

Heben Sie die Markierung in diesem Kontrollkästchen auf, damit Elemente in dem Layer im Trimble Geomatics Office-Graphikfenster gewählt werden können. Falls Sie nicht möchten, daß Elemente in diesem Layer gewählt werden können, aktivieren Sie dieses Kontrollkästchen. Der Wert dieses Feldes wird in dem Symbol Layer-Auswahl in der Layer-Symbolleiste angezeigt.

Wenn der Layer gesperrt ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Wenn der Layer nicht gesperrt ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Wenn das Feld Gesperrt bei einem oder mehreren Layer gewählt ist, erscheint das Symbol [image] in der Statusleiste.

HINWEIS: Wenn Sie dieses Kontrollkästchen wählen, können Sie die Elemente in dem Layer nicht mit einer der folgenden Methoden ansehen:

  im Eigenschaftsfenster

  diese durch Klicken auswählen

  mit einem der Befehle Wählen im Menü Wählen.

Sichtbar

Wählen Sie dieses Kontrollkästchen, um Elemente in dem Layer im Graphikfenster anzusehen. Der Wert dieses Feldes wird in dem Symbol Layer-Auswahl in der Layer-Symbolleiste angezeigt.

Wenn der Layer sichtbar ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Wenn der Layer nicht sichtbar ist, erscheint das Symbol [image] in der Layer-Symbolleiste.

Heben Sie die Markierung in diesem Kontrollkästchen auf, um Elemente in dem Layer auszublenden.

HINWEIS: Wenn Sie die Markierung in diesem Kontrollkästchen aufheben, können Sie die Elemente in dem Layer im Trimble Geomatics Office-Graphikfenster nicht sehen.

Das Symbol Sichtbar [image] erscheint in der Statusleiste, wenn ein Element oder mehrere Elemente in dem Layer ausgeblendet sind. Das bedeutet, daß dieses Symbol in der Statusleiste erscheint, wenn bei einem oder mehreren Layern die Eigenschaft Sichtbar aufgehoben wurde.

ACHTUNG: Wenn ein Layer nicht sichtbar ist, können Sie keine Elemente in diesem Layer ansehen oder auswählen. Dies trifft zu, wenn der Layer gesperrt oder nicht gesperrt ist. Das heißt, die Option Sichtbar deaktiviert die Option Gesperrt.


Befehl Punkte und Text verschieben

Verwenden Sie diesen Befehl, um auf das Dialogfeld Verschieben zuzugreifen. Dieser Befehl ist nur verfügbar, wenn Sie über eine aktuelle Auswahlmenge verfügen. Wählen Sie Bearbeiten / Punkte und Text verschieben, um darauf zuzugreifen.

Das Dialogfeld Verschieben erscheint.


Dialogfeld Verschieben

Verwenden Sie dieses Dialogfeld, um Punkte oder Text zu verschieben.

Wählen Sie Bearbeiten / Punkte und Text verschieben, um darauf zuzugreifen.

Punkte mit Festpunktqualität, festgehaltene Festpunkte oder Punkte mit dem Status Ausgeglichen können nicht verschoben werden. Wenn ein Punkt, den Sie für die Verschiebung ausgewählt haben, Festpunktqualität oder den Status "Fest" oder "Ausgeglichen" aufweist, erscheint eine Meldung.

WARNUNG: Das Verschieben eines Punktes deaktiviert alle Beobachtungen zu dem Punkt oder Koordinaten für den Punkt. Sie können diese unter Verwendung des Eigenschaftsfensters erneut aktivieren. Die erneute Aktivierung von Beobachtungen und Koordinaten kann bewirken, daß der verschobene Punkt zu seiner ursprünglichen Position zurückversetzt wird.

Wählen Sie den Text oder die Punkte aus, und geben Sie die neue Position in das Dialogfeld ein. Das Verschieben erfolgt, wenn Sie auf OK im Dialogfeld klicken.

Verschieben um

Wählen Sie die Option Verschieben um, um den gewählten Text oder die gewählten Punkte zu einer neuen Stelle zu verschieben, durch Verschiebungen nach Norden (Hochwert) und Osten (Rechtswert) (Deltas) definiert.

Es sind zwei Optionen verfügbar:

Delta Re	Diese Option fügt den angezeigten Wert für den Delta-Rechtswert zu den Rechtswerten aller gewählten Einheiten hinzu.

Delta Ho	Diese Option fügt den angezeigten Wert für den Delta-Hochwert zu den Hochwerten aller gewählten Einheiten hinzu.

Verschieben zum Punkt

Wählen Sie das Kontrollkästchen Verschieben zum Punkt, um die gewählten Punkte zu der Position eines anderen Punktes zu verschieben.

Name

Verwenden Sie dieses Feld, um den Punkt an der neuen Position zu benennen oder auszuwählen.

Verschieben zur Koordinate

Wählen Sie das Kontrollkästchen Verschieben zur Koordinate, um den ausgewählten Text oder Punkt zur neuen Position zu verschieben. Die beiden verfügbaren Optionen sind:

Rechtswert	Verwenden Sie dieses Feld, um den neuen Rechtswert für den ausgewählten Punkt einzugeben oder auszuwählen.

Hochwert	Verwenden Sie dieses Feld, um den neuen Hochwert für den ausgewählten Punkt einzugeben oder auszuwählen.

Für alle verschobenen Punkte Höhe auf NULL setzen

Wählen Sie dieses Kontrollkästchen, um die orthometrischen Höhen für die verschobenen Punkte auf NULL zu setzen. Wenn Sie diese Option nicht wählen, wird die bestehende Höhe des Punktes beibehalten.

HINWEIS: Alle Beobachtungen zu einem Punkt, der verschoben wurde, werden deaktiviert.


Dialogfeld Doppelte Punkte

Weitere Informationen

 Siehe auch

Wenn Sie eine Datei importieren, die einen Punkt mit demselben Namen wie ein anderer Punkt im Projekt enthält, ist das Resultat, daß Punkte mit demselben Namen im Projekt erzeugt werden. Das Dialogfeld Doppelte Punkte erscheint mit der folgenden Meldung:

Dieser Importvorgang hat Punkte gleichen Namens in der Datenbank erzeugt (doppelte Punkte).

Sie können diese doppelten Punkte auflösen, indem Sie:

  die Punkte mit doppelten Namen kombinieren, wenn Sie wissen, daß diese sich auf denselben Punkt beziehen

  die Punkte mit doppelten Namen umbenennen, wenn diese sich nicht auf denselben Punkt beziehen.


Feedback

Ihr Feedback über diese Dokumentation trägt zur Verbesserung zukünftiger Revisionen bei.

Führen Sie einen der folgenden Schritte aus, um Ihre Kommentare zu senden:

  Schicken Sie ein E-mail an ReaderFeedback@trimble.com

  Füllen Sie das Leserkommentar-Formular am Ende des Benutzer-Handbuchs aus, und schicken Sie es wie auf dem Formular beschrieben, ein. Wenn kein Leserkommentar-Formular zur Verfügung steht, können Sie Vorschläge und Anregungen an folgende Adresse schicken:

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

USA

Attention: Technical Publications Group

Fax: +1 720 887-6101

www.trimble.com/

Alle Kommentare und Vorschläge werden Eigentum von Trimble Navigation Limited.

Wir bedanken uns für Ihre Hilfe.


Befehl Neues Projekt

Verwenden Sie diesen Befehl, um ein neues Projekt oder eine neue Vorlage zu erzeugen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Neues Projekt.

  Klicken Sie auf die Schaltfläche Neues Projekt [image] in der Standard-Symbolleiste.

  Drücken Sie Strg+N.

Das Dialogfeld Neues Projekt erscheint.


Dialogfeld Neues Projekt

Verwenden Sie dieses Dialogfeld, um ein neues Projekt oder eine Vorlage zu erzeugen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Neues Projekt.

  Klicken Sie auf die Schaltfläche Neues Projekt [image] in der Standard-Symbolleiste.

  Drücken Sie Strg+N.

  Klicken Sie auf die Verknüpfung Neues Projekt in der Projektleiste.

Name

Geben Sie den Namen des Projekts ein, das Sie erzeugen möchten. Ein neuer Ordner mit dem Projektnamen wird im aktuellen Projektordner erzeugt, der mit Hilfe der Schaltfläche Ordner gewählt wurde.

Vorlage

In der Liste Vorlage werden Projektvorlagen angezeigt, die in Ihrem System verfügbar sind. Die Verwendung von Projektvorlagen in Trimble Geomatics Office gleicht der Verwendung von Vorlagendokumenten in Microsoft Word oder Prototyp-Zeichnungen in AutoCAD. Sie erzeugen jedes neue Projekt unter Verwendung einer Vorlage, die die Grundlage des neuen Projekts bildet. Die von Ihnen verwendete Vorlage bleibt unverändert.

TIP: Neue CAD-Stile, die zu einer neuen Vorlage hinzugefügt werden, stehen in den Projekten zur Verfügung, die auf dieser Vorlage basieren. Dort, wo eine laufende Arbeit in einem gegebenen Bereich möglicherweise eine Reihe von individuellen Projekten erfordert, möchten Sie eventuell eine Vorlage erzeugen, die z. B. das spezifische Koordinatensystem für den Bereich, spezielle Stile und Festpunkte einschließt, so daß diese in allen neuen Projekten sofort verfügbar sind.

Nachdem Projektvorlagen definiert worden sind, können Sie die Vorlagen mehrfach für viele verschiedene Projekte verwenden.

Wählen Sie aus den Vorlagen, die in der Liste dargestellt werden, die geeignetste Vorlage. Die von Ihnen gewählte Vorlage bildet die Grundlage für das neue Projekt.

Details

Die Liste Details enthält die Koordinatensystem-Details und Informationen über die gewählte Vorlage. Dies hilft Ihnen bei der Auswahl der geeignetsten Vorlage.

Zudem wird der Ordner, in dem das Projekt erzeugt und verwaltet wird, angezeigt. Dieser Ordner gibt wieder, was direkt im Feld Name oder unter Verwendung der Schaltfläche Ordner definiert wurde.

Projektionsoptionen sind im Vorlagen-Projekt vordefiniert; die Projektion kann geändert werden.

Ordner

Klicken Sie auf Ordner, um den Ordner auszuwählen, in dem Sie ein neues Projekt erzeugen möchten.

Bei der Auswahl eines Ordners mit Hilfe der Schaltfläche Ordner ändert sich der voreingestellte Pfad, den Trimble Geomatics Office beim nächsten Öffnen oder Erzeugen eines Projekts verwendet.

Verwenden Sie die Ordnerstruktur im Dialogfeld Ordner suchen, um einen der folgenden Schritte auszuführen:

  Wählen Sie direkt einen Projektordner.

  Wählen Sie den Ordner, der eine Reihe von Projekten enthält.

Neu

Klicken Sie auf Neu, um ein neues Projekt oder eine neue Vorlage zu erzeugen.

Wenn die Option Vorlage eingestellt ist, können Sie eine neue Vorlage in dem entsprechenden Ordner erzeugen, basierend auf der aktuell gewählten Vorlage. Sie können hiermit neue Vorlagen für spezielle Zwecke erzeugen.


Befehl Projekt öffnen

Verwenden Sie diesen Befehl, um ein bestehendes Projekt zu öffnen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Projekt öffnen.

  Klicken Sie auf die Schaltfläche Projekt öffnen [image] in der Standard-Symbolleiste.

  Drücken Sie Strg+O.

Das Dialogfeld Projekt öffnen erscheint.


Dialogfeld Projekt öffnen

Verwenden Sie dieses Dialogfeld, um ein bestehendes Projekt zu öffnen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

 Wählen Sie Datei / Projekt öffnen.

 Klicken Sie auf die Schaltfläche Projekt öffnen [image] in der Standard-Symbolleiste.

HINWEIS: Wenn Sie bereits ein Projekt geöffnet haben, werden Sie gewarnt, daß durch diesen Vorgang das aktuelle Projekt geschlossen wird.

HINWEIS: Das Dialogfeld Projekt öffnen enthält eine Voransicht des Projekts.

Name

Geben Sie den Namen des Projekts ein, das Sie öffnen möchten.

Unterhalb des Felds Name erscheint eine Liste von Projekten im aktuellen Projektordner. Wählen Sie einen dieser Projektnamen, um den Namen automatisch in das Feld Name einzugeben.

Sie können auch einen Pfad für das zu öffnende Projekt in das Feld Name eingeben.

Sie können z. B. mehrere Projekte im Ordner EIGENEPROJ auf dem Laufwerk C:\ haben.

Geben Sie C:\eigeneproj\ ein. Trimble Geomatics Office zeigt die Projekte, die zur Auswahl zur Verfügung stehen, in diesem Ordner an. Im Gegensatz zum Klicken auf die Schaltfläche Ordner ändert sich die Voreinstellung für den Projektordner nicht, wenn ein Projekt auf diese Weise geöffnet wird, siehe die anschließende Beschreibung der Schaltfläche Ordner.

Ordner

Klicken Sie auf Ordner, um den Ordner auszuwählen, in dem ein Projekt geöffnet werden soll.

Verwenden Sie die Ordnerstruktur im Dialogfeld Ordner suchen, um einen der folgenden Schritte auszuführen:

 Wählen Sie direkt einen Projektordner.

 Wählen Sie den Ordner, der eine Reihe von Projekten enthält.

Details

In der Liste Details werden das Koordinatensystem und die Projektinformationen angezeigt. Sie enthält auch den Ordner, in dem das Projekt gespeichert ist. Verwenden Sie diese Details als Hilfe beim Öffnen des passenden Projekts. Details können unter Datei / Projekteigenschaften / Register Einheiten und Format geändert werden.

HINWEIS: Wenn das WAVE-Basislinienverarbeitungsmodul oder das Netzausgleichungsmodul nicht installiert sind, und Sie ein bestehendes Projekt öffnen, das mit diesen Modulen erzeugt wurde, bleiben die Vermessungsdaten unverändert. Sie können Daten ansehen, die von den deaktivierten Modulen abgeleitet wurden (z. B. Fehlerellipsen und verarbeitete Basislinien). Es stehen keine weiteren Aufgaben, die die Verwendung der deaktivierten Module erfordern, zur Verfügung.


Befehl Projekt schließen

Verwenden Sie diesen Befehl, um das aktuelle Projekt zu schließen.

Wählen Sie Datei / Projekt schließen, um darauf zuzugreifen.

Alle Änderungen, die an einem Projekt vorgenommen werden (einschließlich gespeicherter Auswahlmengen und Ansichten), werden gespeichert, während Sie im Projekt arbeiten. Sie können ein Projekt schließen, ohne es zuerst zu speichern.


Befehl Projekt löschen

Verwenden Sie diesen Befehl, um ein Projekt zu löschen.

Wählen Sie Datei / Projekt löschen, um darauf zuzugreifen.

Das Dialogfeld Projekt löschen erscheint.


Dialogfeld Projekt löschen

Verwenden Sie dieses Dialogfeld, um ein Projekt zu löschen. Das Projekt muß geschlossen sein.

Wählen Sie Datei / Projekt löschen, um darauf zuzugreifen.

TIP: Sie können ein gelöschtes Projekt aus dem Papierkorb wiederherstellen.

Name

Geben Sie den Namen des Projekts ein, das Sie löschen möchten.

Im Dialogfeld Löschen erscheint unterhalb des Felds Name eine Liste von Projekten im aktuellen Projektordner. Wählen Sie einen dieser Projektnamen, um den Namen automatisch in das Feld Name einzugeben.

Sie können auch einen Verzeichnispfad für das Projekt eingeben, das Sie löschen möchten.

Sie können z. B. mehrere Projekte in Ihrem Ordner EIGENEPROJ auf dem Laufwerk C:\ haben.

Geben Sie C:\eigeneproj\ ein. Trimble Geomatics Office zeigt die Projekte in diesem Ordner an, die zur Auswahl zur Verfügung stehen. Im Gegensatz zur Verwendung der Schaltfläche Ordner ändert sich die Voreinstellung für den Projektordner nicht, wenn ein Projekt auf diese Weise gelöscht wird, siehe die anschließende Beschreibung der Gruppe Löschen.

Gruppe Löschen

Wählen Sie die Option Projekt zur Ansicht der Projekte, die Sie löschen möchten.

Wählen Sie die Option Vorlage zur Ansicht der Vorlagen, die Sie löschen möchten.

Ordner

Klicken Sie auf Ordner, um den Ordner auszuwählen, in dem ein Projekt gelöscht werden soll. Bei der Auswahl eines Ordners mit Hilfe der Schaltfläche Ordner ändert sich die Voreinstellung, die Trimble Geomatics Office beim nächsten Öffnen oder Erzeugen eines Projekts verwendet.

Verwenden Sie die Ordnerstruktur im Dialogfeld Ordner suchen, um einen der folgenden Schritte auszuführen:

  Wählen Sie direkt einen Projektordner.

  Wählen Sie den Ordner, der eine Reihe von Projekten enthält.

Löschen

Klicken Sie auf Löschen, um das gewählte Projekt zu löschen. Alle im Projekt enthaltenen Ordner und Dateien werden gelöscht.

Details

Die Liste Details enthält das Koordinatensystem und die Projektinformationen und stellt den Ordner dar, in dem das Projekt gespeichert ist. Verwenden Sie diese Details, um sicherzustellen, daß Sie das richtige Projekt löschen.


Befehl Importieren

Verwenden Sie diesen Befehl, um das Dialogfeld Importieren zu öffnen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Importieren.

  Klicken Sie auf die Schaltfläche Importieren [image] in der Standard-Symbolleiste.

  Verwenden Sie die Gruppe Importieren in der Projektleiste.

Das Dialogfeld Importieren erscheint.


Befehl Exportieren

Verwenden Sie diesen Befehl, um Daten in ein anderes Format oder in ein Trimble-Gerät zu exportieren.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

 Wählen Sie Datei / Exportieren.

 Klicken Sie auf die Schaltfläche Exportieren [image] in der Standard-Symbolleiste.

Das Dialogfeld Exportieren erscheint.


Befehl Blatt konfigurieren

Verwenden Sie diesen Befehl, um die Layout-Einstellungen für das Blatt vor dem Erstellen eines Plots zu ändern.

Sie können:

  den Planrahmen wählen, den Sie für den Plot verwenden möchten

  den Maßstab, Ursprung und die Orientierung des Plots zuweisen

Wählen Sie Datei / Blatt konfigurieren, um darauf zuzugreifen.

Das Dialogfeld Blatt konfigurieren erscheint.


Dialogfeld Blatt konfigurieren

Verwenden Sie dieses Dialogfeld, um die Layout-Einstellungen für das Blatt vor dem Erstellen eines Plots zu ändern. Sie können den Planrahmen wählen, den Sie für den Plot verwenden möchten und den Maßstab, Ursprung und die Orientierung des Plots zuweisen.

Wählen Sie Datei / Blatt konfigurieren, um darauf zuzugreifen.

Planrahmen

Ein Planrahmen stellt eine Vorlage zur Verfügung, in die Sie Ihre Zeichnung plotten. Sie können diese Vorlage anpassen, um Zeichnungskomponenten (wie den Nordpfeil oder Ihr Firmenlogo) sowie den Ausschnitt, Rahmen, das Liniennetz und Textanmerkungen bereitzustellen. Der Planrahmen wird auf die Blattgröße angewendet, die für den ausgewählten Drucker und/oder Plotter festgelegt ist und stimmt mit der jeweiligen Hochformat / Querformat- Einstellung für den Drucker und/oder Plotter überein.

Sie können diese Einstellungen mit Hilfe der Schaltfläche Druckereinr. ändern.

Geben Sie den Dateinamen des gewünschten Planrahmens in das Feld Datei ein.

Durchsuchen

Das Dialogfeld Durchsuchen zeigt eine Liste der verfügbaren Planrahmendateien (*.frm) an.

Wählen Sie den Dateinamen des benötigten Planrahmens.

Trimble Navigation Limited stellt mehrere verschiedene Planrahmen zur Verfügung. Sie können Ihre eigenen Planrahmen erzeugen. Weitere Informationen finden Sie unter Planrahmen - Überblick.

Maßstab, Plot-Rotation, Ursprung Ho (Hochwert), Ursprung Re (Rechtswert)

Verwenden Sie diese Felder, um den Plot-Bereich des Projekts zu definieren.

Nachdem Sie einen Maßstab eingestellt haben, erscheint eine "Plot-Box" im Graphikfenster, die den zu plottenden Projektbereich darstellt. Sie beruht auf den Ursprungskoordinaten. Verändern Sie den Maßstab, um den Erfassungsbereich des Plots zu vergrößern oder zu verkleinern.

TIP: Stellen Sie im Feld Plot-Rotation einen Wert für die erforderliche Plot-Orientierung ein. Der Wert in diesem Feld bestimmt die Ausrichtung des Blattrandes und nicht die Rotation des Nordpfeils auf dem Plot. Die Plot-Box kann verschoben werden. Wenn Sie die Plot-Box verschieben, verschieben Sie sie graphisch um die Daten, um sie an die Projektdaten anzupassen.

Klicken Sie zunächst auf das Feld Ursprung Ho oder Ursprung Re, und klicken und ziehen Sie dann die ‘Plot-Box’, um den erforderlichen Bereich zu umfassen. Sie können im Feld Plot-Rotation einen Wert für die erforderliche Orientierung des Plots einstellen. Mit Hilfe dieses Feldes bestimmen Sie die Ausrichtung des Blattrandes und nicht die Rotation des Nordpfeils auf dem Plot.

OK

Klicken Sie auf OK, um die Blattkonfiguration Ihres Plots zu bestätigen. Diese Konfigurationsdetails werden gespeichert und dann in der Option Plotten/Drucken verwendet.

Beste Anpass.

Klicken Sie auf Beste Anpass., damit das System die optimalen Werte für die Felder Maßstab und Ursprung zum Plotten aller aktuell dargestellten Projektdaten berechnet. Wenn Sie diese Option verwenden, wird die Plot-Rotation auf 0° voreingestellt.

Druckereinr.

Klicken Sie auf Druckereinr., um das Dialogfeld Drucker einrichten für Ihr System zu öffnen. Verwenden Sie dieses Dialogfeld, um den passenden Drucker oder Plotter, die Papiergröße und -zufuhr sowie die Orientierung der Plot-Ausgabe auf dem Papier (Hochformat oder Querformat) zu wählen.


Planrahmen - Überblick
Planrahmen − Überblick

Eine Planrahmendatei (*.frm) wird als Textdatei gespeichert. Sie enthält eine Reihe von Anweisungen, die beschreiben, was im Planrahmen an welcher Stelle plaziert werden soll. Sie können Linien, Text, Symbole (z. B. den Nordpfeil) und Microsoft Windows Enhanced MetaFiles (*.wmf) in eine Planrahmen-Definition einschließen, um das gewünschte Layout zu erstellen.

Bemerkungen

Die vorgegebenen Planrahmen enthalten Bemerkungen, die die Bedeutung der verschiedenen Befehle erklären, die in der Planrahmen-Definition verfügbar sind. Verwenden Sie einen Text-Editor zur Bearbeitung der Planrahmen-Definition. Die vorgegebenen Planrahmen-Definitionen befinden sich normalerweise im Systemordner unter dem Hauptprogrammordner (C:\Programme\Trimble\Trimble Geomatics Office).

TIP: Während der Installation von Trimble Geomatics Office wird der Microsoft Text-Editor zum Öffnen der Dateierweiterung zugewiesen. Wenn Sie eine .frm-Datei bei der Auswahl einer Planrahmendatei oder im Microsoft Windows Explorer-Programm hervorheben, können Sie somit die Option Öffnen im Verknüpfungsmenü verwenden, um die Planrahmen-Details im Microsoft Editor darzustellen.

Weitere Informationen finden Sie unter Details der Planrahmen-Definition.


Details der Planrahmen-Definition

 Überblick

Die Planrahmen-Definitionen werden in einem Format gespeichert, das mit dem Windows-Standarddateiformat *.ini vergleichbar ist. Dieses enthält eine Reihe von Abschnittsinfos, die von Rechteckklammern ( [ ] ) umschlossen sind. In jedem Abschnitt werden einzelne Elemente definiert, wobei jedes Element einen eindeutigen Namen besitzt und mit Hilfe eines ‘=’-Zeichens mit einem entsprechenden Wert versehen ist. Es können Bemerkungen in eine Datei eingefügt werden, wobei für Bemerkungen jedoch eine eigene Zeile erforderlich ist, die mit einem Semikolon (;) beginnen muß.

Ein spezielles Koordinatensystem innerhalb der Planrahmen-Definitionen ermöglicht es, daß der gleiche Planrahmen auf verschiedenen Plot-Blattgrößen angewendet werden kann. Alle Koordinatenwerte werden in Millimetern verstanden und werden grundsätzlich paarweise durch Kommas getrennt und in Klammern angegeben, wobei der x- (oder horizontale) Wert zuerst und der y- (oder vertikale) Wert an zweiter Stelle aufgeführt wird.

(20,40) ist z. B. eine gültige Koordinatenposition. Für die obere linke plottfähige Ecke des Blattes sind die Koordinaten +0,0; +0,0 definiert. Alle positiven Koordinatenwerte befinden sich demnach rechts und unterhalb dieser Position. Für die untere rechte plottfähige Ecke des Blattes sind die Koordinaten –0,0; –0,0 definiert. Alle negativen Koordinatenwerte befinden sich demnach links und oberhalb dieser Position.

HINWEIS: Die plottfähigen Ecken eines Blattes sind die tatsächlichen Plott- oder Druck-Grenzen eines Plotters oder Druckers auf einem gegebenen Blatt. Diese Grenzen variieren je nach den unterschiedlichen Plottern und Druckern. Die Grenzen werden von bestimmten Faktoren beeinflußt, wie z. B. von der Art, in der das Papier in den Rollen eines Plotters gehalten wird.

Zur Veranschaulichung werden die unterschiedlichen Koordinatenpositionen in der nachstehenden Tabelle im Einzelnen interpretiert:

Abschnitte

Die Abschnitte in einer Planrahmen-Definitionsdatei sind die folgenden:


Befehl Plotten / Drucken

Verwenden Sie diesen Befehl, um:

  eine Liste der installierten Plotter und Drucker anzusehen.

  den Standard-Plotter oder Drucker festzulegen.

  auf andere Plott- oder Druckoptionen für den ausgewählten Plotter oder Drucker zuzugreifen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Plotten/Drucken.

  Drücken Sie Strg+P.

Bevor Sie in Trimble Geomatics Office drucken können, müssen Sie:

  den Plotter oder Drucker mit Ihrem Computer oder einem Netzwerk verbinden.

  einen Plotter- oder Druckertreiber mit Hilfe von Microsoft Windows Setup oder der Microsoft Windows Systemsteuerung installieren, falls noch nicht vorhanden. Weitere Informationen finden Sie in der Microsoft Windows-Hilfe.

  im Dialogfeld Plotter/Drucker konfigurieren den Plotter oder Drucker auswählen, den Sie verwenden möchten.

HINWEIS: Wenn Gitterlinien im Graphikfenster angezeigt werden, werden diese auf den Plot gedruckt.


Befehl Projekteigenschaften

Verwenden Sie diesen Befehl, um das Dialogfeld Projekteigenschaften zu öffnen.

Wählen Sie Datei / Projekteigenschaften, um darauf zuzugreifen.


Befehl Letztes Projekt

Das Menü Datei listet die letzten vier Projekte auf, die Sie zuvor geöffnet haben.

Um ein kürzlich verwendetes Projekt zu öffnen, wählen Sie eines aus Liste im Menü Datei.


Befehl Beenden

Verwenden Sie diesen Befehl, um das aktuelle Projekt zu schließen und Trimble Geomatics Office zu beenden.

Trimble Geomatics Office speichert Ihre Änderungen automatisch.


Befehl Projekt kopieren

Verwenden Sie diesen Befehl, um eine Kopie eines bestehenden Trimble Geomatics Office-Projekts zu erstellen. Dieser Befehl steht nur zur Verfügung, wenn kein Projekt geöffnet ist.

Das Dialogfeld Zu kopierendes Projekt erscheint.


Dialogfeld Zu kopierendes Projekt

Verwenden Sie dieses Dialogfeld, um das Projekt auszuwählen, das Sie kopieren möchten.

So greifen Sie auf dieses Dialogfeld zu:

  Wählen Sie Datei / Projekt kopieren.

Diese Option ist nur verfügbar, wenn kein Projekt geöffnet ist.

Wählen Sie ein Projekt aus der Liste.

Die Details für das ausgewählte Projekt erscheinen unterhalb der Projektliste.

Ordner

Klicken Sie auf Ordner, um ein Projekt aus einem anderen Ordner zu wählen.

Wenn Sie das zu kopierende Projekt ausgewählt haben, klicken Sie auf OK.

Das Dialogfeld Projekt kopieren nach erscheint.


Dialogfeld Projekt kopieren nach

Verwenden Sie dieses Dialogfeld, um den neuen Namen des Projekts, das Sie kopieren, einzugeben.

Projekttitel

Geben Sie den Namen für das Projekt ein.

Ordner

Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf die Ellipsen-Schaltfläche (…), um das Projekt in einen anderen Ordner zu kopieren.

  Geben Sie den Ordnerpfad mit Hilfe der Tastatur ein.


FTP-Adresse

Verwenden Sie die Trimble FTP-Adresse, um Dateien wie z. B. Software-Korrekturroutinen (Patches), Hilfsprogramme und FAQs (Häufig gestellte Fragen) zu senden oder zu empfangen. Sie können zudem von der Trimble World Wide Web-Adresse auf die FTP-Adresse zugreifen: www.trimble.com/support/support.htm.


GIS-Formate - Überblick
GIS-Formate − Überblick

Weitere Informationen

Wie kann ich...	Siehe auch
Überblick

Sie können Punkte und deren zugeordnete Attribute aus Trimble Geomatics Office in eine Vielzahl von Formaten für Geographische Informationssysteme (GIS) exportieren. Linien, Bögen, Kurven, Text und Anmerkungen werden nicht exportiert, siehe die folgende Tabelle.

Beim Exportieren können Sie neue zu exportierende Attribute erzeugen (z. B. die Zeit oder das Datum, an denen das Attribut aufgezeichnet wurde, oder die orthometrische Höhe des Punktes).

Sie können auch benutzerdefinierte ASCII-Export- oder Berichtsformate erzeugen, um Punkte und ihre Attribute zu exportieren.

Zwei benutzerdefinierte Berichtsformate sind enthalten:

  Name,Breitengrad,Längengrad,Ellips. Höhe,Alle Attribute (Örtlich)

  Name,Hochwert,Rechtswert,Höhe,Alle Attribute

Verwenden Sie das Register GIS, um Daten in eine Vielzahl von GIS-Formaten zu exportieren.

So greifen Sie auf dieses Register zu:

1.	Führen Sie einen der folgenden Schritte aus:

   Wählen Sie Datei / Exportieren.

   Verwenden Sie die Gruppe Exportieren in der Projektleiste.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register GIS.

Sie können benutzerdefinierte Formate zu diesem Register hinzufügen. Weitere Informationen finden Sie unter Asciiexp.dat-Datei.

Informationen zum Exportieren in ein GIS-Format finden Sie unter GIS-Export-Formate.

Dieses Register hat die folgenden Formate:


ArcView-Dateien (*.dbf, *.shp, *.shx)-Option

Wenn Sie in das ArcView-Format exportieren, werden für jeden Kartiercode mit Attributen drei Dateien erstellt.

Die folgende Tabelle beschreibt diese Dateien:

Diese Dateien sind Binärdateien. Sie können diese Dateien nicht mit einem Texteditor ansehen oder bearbeiten.

Trimble Geomatics Office vergibt die Namen für diese Dateien automatisch.

Beispiel: Wenn Sie Punkte mit Attributen für den Kartiercode 'Baum' haben, werden folgende Dateien erzeugt:

  Baum.shp

  Baum.shx

  Baum.dbf

Informationen über ArcView-Einstellungen finden Sie unter dem Thema Dialogfeld Export-Optionen. ArcView hat keine zusätzlichen Einstellungen außer den Einstellungen für alle Formate.

HINWEIS: 3D-Punkte werden nur von der ArcView-Version 3.1 oder höher unterstützt.


AutoCAD-Datei mit Attributen (*.dxf)-Option

Wenn Sie in die AutoCAD-Datei mit Attributen (*.dxf)-Option exportieren, wird eine .dxf-Datei erzeugt.

Verwenden Sie Drawing eXchange Format (.dxf)-Dateien, um graphische und tabellarische Daten auszutauschen und anzuzeigen.

Konfigurieren

Zusätzlich zu den Standardeinstellungen, die unter dem Thema Dialogfeld Export-Optionen beschrieben sind, gibt es auch AutoCAD-spezifische Einstellungen.

Klicken Sie auf Optionen. Das Dialogfeld Export-Optionen erscheint.

Textgröße

Sie können die Größe des Texts in der Ausgabedatei mit folgenden Optionen festlegen:

Automatisch	Die Textgröße wird automatisch aus der Eingabedatei berechnet.
Fest	Die Textgröße ist festgelegt. Hierzu können Sie entweder:   im Feld Textgröße die gewünschte Textgröße eingeben.   die Pfeil-Schaltflächen verwenden.
Datenblock-Optionen

Wählen Sie das Kontrollkästchen Merkmale in Datenblöcken exportieren, um die Attributinformationen in Datenblöcken zu exportieren. Dies bedeutet, daß die Attribute abgefragt und bearbeitet werden können, wenn Sie in ein GIS- oder CAD-System eingelesen werden, das das .dxf-Format unterstützt. Die Gruppe Datenblock-Einfügepunkt wird verfügbar. Es gibt zwei Optionen für das Plazieren eines Einfügepunkts in einen Block:

  Ursprung	Plazieren Sie den Einfügepunkt an Position 0,0 im Block.

  Schwerpunkt	Plazieren Sie den Einfügepunkt in dem berechneten Schwerpunkt des Blocks.

Wenn das Kontrollkästchen Merkmale in Datenblöcken exportieren nicht gewählt ist, sind diese Optionen nicht verfügbar. Statt dessen werden Positionsinformationen für ein Merkmal als POLYLINIEN- oder PUNKT-Elemente gespeichert, und die Attributinformationen werden als TEXT geschrieben. TEXT wird für jedes Merkmal in den entsprechenden Layer geschrieben. Die Gruppe Datenblock-Einfügepunkt ist nicht verfügbar.

HINWEIS: Wenn Sie nicht in Blöcken exportieren, werden Attributnamen nicht exportiert, nur die Werte für die Attribute. Wenn Sie nicht in eines der AutoCAD-GIS-Pakete exportieren, z. B. AutoCAD Map, exportieren Sie immer in Blöcken, damit die Attributnamen enthalten sind.

Layer-Optionen

Die .dxf-Datei organisiert verschiedene Informationen in Layern. Diese Layer können unabhängig voneinander bearbeitet werden. Es gibt zwei Layer-Optionen:

  Ein Merkmal pro Layer − für jedes Merkmal wird ein unterschiedlicher Layer erzeugt. Beispiel: Mast-Merkmale werden in einem anderen Layer abgelegt als Baum-Merkmale. Der Layer-Name ist der Name des Merkmals.

  Alle Merkmale in einem Layer − Alle Merkmale werden in einem einzigen Layer abgelegt. Das Feld Layer-Name ist verfügbar. Geben Sie den Namen des Layers in das Feld Layer-Name ein. Das Feld Layer-Name darf nicht leer bleiben.

Leerzeichen in Merkmalsnamen in Unterstriche ändern

Einige Programme, die .dxf-Dateien lesen, erfordern, daß Layer-Namen in .dxf-Dateien keine Leerzeichen beinhalten. Wählen Sie diese Option, um alle Leerzeichen in Merkmalsnamen in Unterstrich-Zeichen (_) umzuwandeln.


MapInfo-Dateien (*.mif, *.mid)-Option

Wenn Sie in das MapInfo-Format exportieren, werden zwei Dateien für jeden Kartiercode mit Attributen erzeugt. Sie werden in der folgenden Tabelle erläutert:

Diese Dateien sind Textdateien. Sie können diese Dateien mit einem Texteditor ansehen oder bearbeiten. Nachfolgend ist ein Beispiel einer solchen Datei dargestellt:

MIF-Datei

VERSION 2

  DELIMITER "	"

  COORDSYS EARTH PROJECTION 1, 104

COLUMNS 3

  Höhe_m  DECIMAL(5,0)

  Aktion_erforderlich  CHAR(30)

  Bemerkungen  CHAR(30)

DATA

POINT 700345.32 306565.45

POINT 700356.47 306125.38

POINT 700937.71 306505.41

MID-Datei

1	Ja	Zweige in Leitungen

2	Ja	Abgestorben

3	Nein	Direkt neben Mast

Trimble Geomatics Office vergibt Namen für diese Dateien automatisch. Beispiel: Wenn Sie Punkte mit Attributen für den Kartiercode 'Baum' haben, werden die folgenden Dateien erzeugt:

  Baum.mif

  Baum.mid

MapInfo verfügt über keine zusätzlichen Einstellungen außer den Einstellungen für alle Formate. Diese sind unter dem Thema Dialogfeld Export-Optionen beschrieben.

HINWEIS: MapInfo unterstützt nur 2D-Punkte.


Microstation-Datei (*.dgn)-Option

Wenn Sie in das Microstation (*.dgn)-Format exportieren, wird eine Datei erzeugt. Sie müssen den Namen der zu exportierenden Datei eingeben.

Konfigurieren

Zusätzlich zu den für alle Formate im Dialogfeld Export-Optionen verfügbaren Einstellungen, können Sie mit Hilfe folgender Optionen den Export in das Microstation DGN-Format konfigurieren:

Zugreifbar machen

Wählen Sie dieses Kontrollkästchen, um sicherzugehen, daß die erzeugte .dgn-Datei 'zugreifbare', d. h. einklinkende Merkmale hat. Mit dieser Option in Microstation rastet der Cursor auf die exakte Position eines Merkmals ein, wenn Sie in dessen Nähe klicken.

Auflösungseinheit

Geben Sie die Auflösungseinheit für GPS-Positionen in der Ausgabedatei ein. Wenn Sie die GPS-Daten mit bestehenden Daten im .dgn-Format überlagern möchten, ist es wichtig, daß die Auflösungseinheiten in beiden Dateien identisch sind.

Es gibt zwei Optionen:

  Automatisch − Die Auflösungseinheiten werden automatisch gemäß den Einstellungen im Feld Dezimalstellen Koordinate in Datei / Projekteigenschaften / Register Einheiten und Formate des Trimble Geomatics Office-Projekts berechnet.

  Benutzerdefiniert − Die Auflösungseinheiten können von Hand in dieses Feld eingegeben werden.

Koordinatenursprung

Wählen Sie die Berechnungsmethode für den Koordinatenursprung. Wenn Sie die GPS-Daten mit bestehenden Daten im .dgn-Format überlagern möchten, ist es wichtig, daß der Koordinatenursprung in beiden Dateien identisch ist.

Die zwei Optionen sind:

  Automatisch − Der Koordinatenursprung wird automatisch aus der Eingabedatei berechnet.

  Benutzerdefiniert − Die X-, Y- und Z-Koordinaten des Koordinatenursprungs können von Hand in dieses Feld eingegeben werden.


Dialogfeld Export-Optionen (GIS-Export)

Verwenden Sie dieses Dialogfeld, um die Optionen für das Geographische Informationssystem (GIS)-Format zu bearbeiten, in das Sie exportieren möchten.

So greifen Sie auf dieses Dialogfeld zu:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Klicken Sie im Register GIS auf Optionen.

HINWEIS: Die verfügbaren Optionen in diesem Dialogfeld hängen vom gewählten Exportformat ab. Diese Einstellungen werden in den Abschnitten über die entsprechenden Formate beschrieben:

  ArcView-Dateien (*.dbf, *.shp, *.shx)

  AutoCAD-Datei mit Attributen (*.dxf)

  MapInfo-Dateien (*.mif, *.mid)

  Microstation-Datei (*.dgn)

Im Gegensatz zu den formatabhängigen Einstellungen werden die Einstellungen, die für alle Formate gelten, im folgenden beschrieben.

Dateiformat

Es gibt drei verschiedene Dateiformate:

  DOS-Format

Wählen Sie diese Option, wenn das Zielsystem unter MS-DOS läuft oder Text im MS-DOS ASCII-Zeichensatz enthält. Textdateien in diesem Format haben <CarriageReturn> <NewLine> als Datensatzbegrenzer.

  Windows-Format

Wählen Sie diese Option, wenn das Zielsystem unter einem Microsoft Windows-Betriebssystem läuft oder Text im ANSI-Zeichensatz enthält. Textdateien in diesem Format haben <CarriageReturn> <NewLine> als Datensatzbegrenzer.

  UNIX-Format

Wählen Sie diese Option, wenn das Zielsystem unter einem UNIX-Betriebssystem läuft. Textdateien in diesem Format haben <NewLine> als Datensatzbegrenzer.

HINWEIS: Nur die gültigen Dateiformate für das ausgewählte GIS-Format sind verfügbar.

Dimensionen

Wenn das GIS-Exportformat dreidimensionale (3D) Punkte unterstützt, können Sie zweidimensionale (2D) Punkte (Hochwert, Rechtswert) oder dreidimensionale (3D) Punkte (Hochwert, Rechtswert, Höhe) exportieren. Diese Option ist nicht verfügbar, wenn das GIS-Format 3D-Punkte nicht unterstützt.

TIP: Wenn das GIS-Format 3D-Punkte nicht unterstützt, klicken Sie auf Attribute, und wählen Sie die Option Punkthöhe, um Punkthöhen zu exportieren.

Attribute

Klicken Sie auf Attribute, um die erzeugten Attribute zu wählen, die mit den Punkten exportiert werden sollen. Das Dialogfeld Attribute erscheint. Verwenden Sie dieses Dialogfeld, um den Export von Menüattributen zu konfigurieren.

HINWEIS: Die im Dialogfeld Attribute verfügbaren Optionen sind für alle GIS-Formate gleich.


Dialogfeld Attribute (GIS-Export-Optionen)

Verwenden Sie dieses Dialogfeld, um alle Attributwerte auszuwählen, die Trimble Geomatics Office in die Exportdatei einschließen soll. Die Attribute werden unter Verwendung der in der Datenbank gespeicherten Punktwerte erzeugt. In diesem Dialogfeld können Sie keine eigenen Attribute zum Hinzufügen erzeugen.

Die verfügbaren Optionen im Dialogfeld Attribute sind für alle Geographischen Informationssystem (GIS)-Formate identisch.

Erzeugte Attribute

Wählen Sie eine beliebige Kombination dieser Optionen, die für jeden exportierten Punkt hinzugefügt werden sollen. Dies ist nützlich, wenn Sie in ein 2D-GIS exportieren und die orthometrischen Höhen exportieren möchten. In der GIS-Software, in die Sie exportieren, werden erzeugte Attribute als normale Attribute angezeigt.

HINWEIS: Erzeugte Datums- und Zeitattribute werden im zuletzt in der Merkmals- und Attributbibliothek verwendeten Format exportiert.

Menüattribute exportieren als

Wenn eine Merkmals- und Attributbibliothek- (*.fcl) oder Attribut-Verzeichnisdatei (*.ddf) definiert ist, können Sie bis zu zwei Codewerte für jeden Menüattributpunkt festlegen.

Beispiel: Betrachten Sie einen Kartiercode ‘Baum’ mit einem Menüattribut ‘Typ’. Jeder Menüpunkt kann Codewerte haben. Der Typ ‘Einheimisch’ kann die Codewerte EI und EH haben. Typ-Attribute von Punkten mit einem Baum-Kartiercode mit aufgezeichneten Attributen können als tatsächliche Attributwerte (z. B. Einheimisch), als 'Benutzercode 1' (z. B. EI) oder als 'Benutzercode 2' (z. B. EH) exportiert werden. Dies ist nützlich, wenn Ihr GIS nur Attributwerte mit zwei Zeichen unterstützt.

Weitere Informationen über Codewerte finden Sie in der Hilfe des Feature and Attribute Editor-Programms.


Befehl Hilfethemen

Verwenden Sie den Befehl Hilfethemen, um die Online-Hilfe zu öffnen.


Befehl Tip des Tages

Das Tip des Tages-System bietet Tips, die Ihnen bei der Verwendung von Trimble Geomatics Office assistieren.

Wählen Sie diesen Befehl, um den nächsten Tip des Tages anzeigen zu lassen.

Aktivieren Sie das Kontrollkästchen Tips bei Programmstart anzeigen, wenn Tips beim Starten von Trimble Geomatics Office angezeigt werden sollen.


Dialogfeld Tip des Tages

Das Tip des Tages-System bietet Tips, die Ihnen bei der Verwendung von Trimble Geomatics Office assistieren.

Aktivieren Sie das Kontrollkästchen Tips bei Programmstart anzeigen, wenn Tips beim Starten von Trimble Geomatics Office angezeigt werden sollen.


Befehl Info über Trimble Geomatics Office

 Wie kann ich ...

Verwenden Sie diesen Befehl, um Programm- und Copyright-Informationen sowie die Versionsnummer von Trimble Geomatics Office anzuzeigen.


Dialogfeld Info über Trimble Geomatics Office

Dieses Dialogfeld zeigt Programm- und Copyright-Informationen sowie die Versionsnummer von Trimble Geomatics Office an.


Verwenden der Hilfe

Es gibt mehrere Wege, um in der Trimble Geomatics Office Software Hilfe zu erhalten.

Um Hilfe in einem Dialogfeld zu erhalten	Stellen Sie sicher, daß das Dialogfeld aktiv ist, und drücken Sie F1.
Um Hilfe zu einem Menübefehl zu erhalten	1. Plazieren Sie den Cursor über dem Menübefehl, und halten Sie die linke Maustaste gedrückt. 2. Drücken Sie F1.
Um ein Thema im Hilfe-System per Inhalt zu finden	Wählen Sie das Register Inhalt, um durch die Themen nach Kategorien wie in einem Buch zu blättern.
Um ein Thema im Hilfe-System per Index zu finden	Wählen Sie das Register Index, um eine Liste mit Index-Einträgen anzuzeigen. Geben Sie das Wort ein, nach dem Sie suchen, oder rollen Sie durch die Liste.
Um nach einem Ausdruck oder Satz im Hilfe-System zu suchen	1. Wählen Sie das Register Suchen. 2. Der Assistent für die Konfiguration der Suchfunktion kann erscheinen. Wenn er erscheint, wählen sie die Option Datenbankgröße minimieren, und klicken Sie auf Weiter >, dann klicken Sie auf Fertig stellen. 3. Geben Sie in das Feld 'Geben Sie die gewünschten Suchbegriffe ein' das Wort oder den Satz ein, den Sie finden möchten. 4. Falls notwendig, wählen Sie ein Wort im Feld 'Markieren Sie einige Wortentsprechungen als einschränkende Suchkriterien', um die Suche zu begrenzen. 5. Wählen Sie ein Thema im Feld 'Klicken Sie auf ein Thema und dann auf Anzeigen', um ein Thema auszuwählen. Es wird in der rechten Seite des Hilfe-Fensters angezeigt. TIP: Um den Index wiederherzustellen, wählen Sie Suche / Optionen.
Um ein Hilfe-Thema auszudrucken	Um das aktuelle Hilfe-Thema zu drucken, führen Sie einen der folgenden Vorgänge aus:  Klicken Sie auf Drucken.  Wählen Sie im Menü Datei den  Befehl Drucken.  Klicken Sie mit der rechten Maustaste innerhalb des Hilfefensters, und wählen Sie dann den Befehl Drucken. HINWEIS: Sie können einzelne Hilfe-Themen aber keine ganzen Hilfe-Bücher drucken.  Um Informationen in einem Popup-Fenster zu drucken, verwenden Sie die rechte Maustaste, um die Informationen darin anzuklicken. Dann klicken Sie auf den Befehl Drucken.
TIP: Klicken Sie auf Zurück in der Symbolleiste der Hilfe, um Themen anzuzeigen, die Sie vorher bereits angezeigt haben.


Über Notiz-Datensätze berichten

 Überblick und weitere Informationen

Erzeugen Sie einen benutzerdefinierten Datenbank-Bericht, um über Notizen aus der Trimble Geomatics Office-Projektdatenbank zu berichten. Benutzerdefinierte Datenbank-Berichte stützen sich auf die primären Datensatztypen oder Abfragen, die in der Datenbank definiert sind.

Die Erstellung eines benutzerdefinierten Berichts besteht aus zwei Teilen:

  Definition der Auswahlmenge

  Erzeugung eines Berichtsformats


Auswahlmengen definieren

So wählen Sie nicht-graphische Datensatztypen (wie z. B. Notiz-Datensätze) aus:

1.	Führen Sie einen der folgenden Schritte aus:

  Verwenden Sie die Auswahlmenge der DC-Datei.

  Wählen Sie Wählen / Nach Abfrage.

2.	Wählen Sie die Datensatztypen.

HINWEIS: Wenn Sie Ganze Datenbank wählen, enthält der Bericht alle Notizen in der Datenbank.


Ein Berichtsformat erzeugen

So führen Sie dies durch:

1.	Wählen Sie Berichte / Zusätzliche Berichte. Das Dialogfeld Zusätzliche Berichte erscheint. In der Liste Berichte werden die verfügbaren Berichte angezeigt.

2.	Klicken Sie auf Neu, um ein neues Berichtsformat zu erzeugen. Das Dialogfeld Berichtsformat definieren erscheint.

3.	Geben Sie einen Namen für den Bericht im Feld Name ein.

4.	Wählen Sie Notiz-Datensätze im Feld Bericht über.

5.	Führen Sie einen der folgenden Schritte im Feld Formatinhalt aus:

  Geben Sie [Notiz] ein.

  Verwenden Sie das Verknüpfungsmenü, und wählen Sie Notiz.

Das voreingestellte HTML-Anzeigemodul wird geöffnet und zeigt den Bericht an. Sie können den Bericht ausdrucken oder speichern.


Berichte über (im Feld erfaßte) Notiz-Datensätze mit Punktinformationen erzeugen

Notiz-Datensätze sind nicht direkt mit den Punkten in Trimble Geomatics Office verbunden. Aus diesem Grunde können Notiz-Datensätze und Punktinformationen (z. B. Ho, Re, Notizen) unter Verwendung des vorstehend beschriebenen Vorgangs nicht direkt exportiert werden. Sie können jedoch Notizen mit Hilfe des Kartiercode-Feldes exportieren.

So führen Sie dies durch:

1.	Verwenden Sie das DC Editor Dienstprogramm, um die GPS-Vektordatensätze (GPS VEC), auf die eine Notiz folgt, in der .dc-Datei zu finden.

2.	Geben Sie in die CODE-Felder dieser GPS-Vektordatensatzfelder nach dem aktuellen Code einen Bindestrich ein und danach die Notizinformationen, z. B. BAUM - Pinie

Beim Importieren des Datensatzes wird der Notiz-Datensatz am Ende des Kartiercode-Feldes hinzugefügt. Die Notiz ist nun mit dem Punkt verbunden, und Sie können einen Bericht erstellen, der folgendes enthält:

  den Punkt, Hochwert, Rechtswert, Kartiercode

HINWEIS: Manchmal steht hinter dem GPS-Vektordatensatzfeld zuerst ein Zeitstempel und dann erst der Notiz-Datensatz. In einem solchen Fall ist der Zeitstempel nicht mit dem Punkt, sondern mit dem Kartiercode verbunden. Sie müssen dann den Zeitstempel-Datensatz löschen.


Einen benutzerdefinierten Punkt-Bericht erstellen

 Überblick und weitere Informationen

Erstellen Sie einen benutzerdefinierten Datenbank-Bericht, um über Punkt-Datensätze aus der Trimble Geomatics Office-Datenbank zu berichten. Benutzerdefinierte Berichte stützen sich auf primäre Datensatztypen oder Abfragen, die in der Datenbank definiert sind.


Einen benutzerdefinierten Datenbank-Bericht erstellen

1.	Wählen Sie Berichte / Zusätzliche Berichte. 	Das Dialogfeld Zusätzliche Berichte erscheint. In der Liste Berichte werden die verfügbaren Berichte angezeigt.

2.	Klicken Sie auf Neu, um ein neues Berichtsformat zu erstellen. Das Dialogfeld Berichtsformat definieren erscheint.

3.	Geben Sie einen Namen für den Bericht im Feld Name ein. Gemäß Voreinstellung erscheint das Element Punkt-Datensätze im Feld Bericht über.

4.	Klicken Sie auf Format automatisch ausfüllen, und Trimble Geomatics Office vervollständigt die Felder Formatkopf und Formatinhalt. Sie können diese Formate bearbeiten.

TIP: Klicken Sie mit der rechten Maustaste in die Felder Formatkopf und Formatinhalt, wählen Sie zunächst die Felder und dann die Feldcodes in der Liste verfügbaren Feldcodes.

5.	Klicken Sie auf OK.

Das voreingestellte HTML-Anzeigemodul wird geöffnet und zeigt den Bericht an. Sie können den Bericht ausdrucken oder speichern.


Die Zone in der Projektion des Projekts ändern

 Überblick und weitere Informationen

HINWEIS: Die Zone muß in der Koordinatensystem-Datenbank enthalten sein.

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Koordinatensystem.

3.	Klicken Sie in der Gruppe Koordinatensystem-Einstellungen auf Ändern. Das Dialogfeld Koordinatensystem wählen erscheint.

4.	Wählen Sie die Option Neues System, und klicken Sie auf Weiter. Das Dialogfeld Koordinatensystemtyp wählen erscheint.

5.	Wählen Sie die Option Koordinatensystem und Zone, und klicken Sie dann auf Weiter.

6.	Heben Sie in der Gruppe Koordinatensystemzone das Koordinatensystem hervor, das die gewünschte Zone enthält.

7.	Heben Sie erforderliche Zone in der Gruppe Zone hervor, und klicken Sie dann auf Weiter.

Das Dialogfeld Geoid-Modell wählen erscheint.

8.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie das Geoidmodell, das Sie für das Projekt benötigen.

  Klicken Sie auf Kein Geoidmodell.

9.	Klicken Sie auf Fertig stellen.

Das Koordinatensystem wird auf die Datenbank angewendet. Alle in der Datenbank enthaltenen Punkte werden in das neue Koordinatensystem konvertiert.

Wenn Sie Punktpositionen mit NULL-Höhen haben oder Koordinaten mit der Höhe NULL in Ihrem Projekt eingeben und keine Projekthöhe definiert ist, wird die Auswahl des Koordinatensystems fehlschlagen, da Trimble Geomatics Office bestehende Punkte ohne ungefähre orthometrische Höhe nicht von einem System in ein anderes konvertieren kann.


Eine Hintergrundkarten-Datei zu Trimble Survey Controller exportieren

 Überblick und weitere Informationen

1.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Datei / Exportieren.

  Klicken Sie auf das Symbol Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Merkmals- und Attributbibliothek direkt zu Survey Controller (*.fcl). Das Dialogfeld Merkmals- und Attributbibliothek wählen erscheint.

3.	Klicken Sie auf Durchsuchen, um die .fcl-Datei zu finden, die Sie exportieren möchten.

4.	Wählen Sie das Kontrollkästchen Attribute exportieren, um in der Merkmals- und Attributbibliothek enthaltene Attributdefinitionen zu exportieren. Diese Option macht die Attribute in Trimble Survey Controller verfügbar. Wenn das Kontrollkästchen nicht gewählt ist, wird keines der Attribute, die in der .fcl-Datei definiert sind, exportiert.

HINWEIS: Steuercodes werden ebenfalls exportiert.

5.	Klicken Sie auf OK. Das Dialogfeld Data Transfer Speichern unter erscheint.

6.	Prüfen Sie, ob das Gerät (auf dem Trimble Survey Controller ausgeführt wird) mit Ihrem Computer verbunden ist.

7.	Wählen Sie ein Survey Controller-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde wird eingeblendet.

Das Dialogfeld Speichern erscheint, nachdem die Verbindung hergestellt ist.

8.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), um die Bibliothek im Hauptspeicher des Trimble Survey Controllers zu speichern.

  Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Bibliothek auf der PC-Karte speichern möchten.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

9.	Klicken Sie auf Öffnen. Der von Ihnen gewählte Bereich wird gelesen. Es werden alle Merkmals- und Attributbibliothek-Dateien im Verzeichnis dargestellt. Der interne Name der Merkmals- und Attributbibliothek erscheint im Feld Dateiname.

10.	Bearbeiten Sie das Feld Dateiname, um den Namen der Datei in Trimble Survey Controller zu ändern, falls erforderlich. Der Name der ursprünglichen Datei in Ihrem Computer wird nicht geändert.

11.	Klicken Sie auf Speichern. Das Dialogfeld Sende erscheint. Die Statusleiste zeigt den Status der Übertragung an.

Nach dem Abschluß der Übertragung wird das Dialogfeld Sende ausgeblendet und die Verbindung zum Gerät unterbrochen.

Die Bibliothek wurde übertragen.


In ein GIS-Format exportieren

 Überblick und weitere Informationen

1.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Datei / Exportieren.

  Klicken Sie auf das Symbol Exportieren in der Standard-Symbolleiste.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register GIS das von Ihnen gewünschte Format.

3.	Klicken Sie auf Optionen, um die Einstellungsoptionen für die Exportformate zu ändern. Sie können die Optionen konfigurieren, die für das GIS-Format, in das Sie exportieren, geeignet sind.

4.	Klicken Sie auf OK. Das Dialogfeld Dateiname erscheint.

5.	Geben Sie einen Namen für die neue Datei an, und klicken Sie auf Speichern, um die neue Datei/die neuen Dateien zu erstellen.


Eine kombinierte Datum-Gitternetz-Datei (.cdg) für die Übertragung zu Trimble Survey Controller erzeugen

 Überblick und weitere Informationen

HINWEIS: Um eine neue kombinierte Datum-Gitternetz-Datei zu erzeugen, können Sie nur die gerade im Projekt verwendete Datum-Gitternetz-Datei verwenden. Sie können jedoch alle kombinierten Datum-Gitternetze exportieren. Sie können eine kombinierte Datum-Gitternetz-Datei nur zur Trimble Survey Controller-Version 7.00 oder höher übertragen.

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Datum-Gitternetz zu Survey Controller (*.cdg), und klicken Sie auf OK. Das Dialogfeld Ein Datum-Gitternetz exportieren erscheint.

3.	Wählen Sie die Option Eine kombinierte Datum-Gitternetz-Datei für den Export zum Survey Controller erzeugen.

Das Dialogfeld Kombinierte Datum-Gitternetz-Datei erscheint.

Das gelbe Feld auf dem Globus definiert die von den Breitengrad- und Längengrad-Gitternetz-Dateien abgedeckte Fläche. Diese werden auf der rechten Seite des Dialogfelds Kombinierte Datum-Gitternetz-Datei festgelegt.

4. 	Um die Größe der Datei zu verringern, verwenden Sie das Symbol Wählen im linken Bereich des Dialogfelds Kombinierte Datum-Gitternetz-Datei. Ziehen Sie das schwarze Auswahlfeld über die Fläche im gelben Feld, für die Sie das kombinierte Datum-Gitternetz erzeugen möchten.

Die Dateigröße zeigt die Größe, und die Breitengrad- und Längengradgrenzen zeigen die Ausdehnung der zu erstellenden kombinierten Datum-Gitternetz-Datei an.

5.	Im Namensfeld des Survey Controllers wird der Name der untergitterten kombinierten Gitternetz-Datei, die im Trimble Survey Controller-Projekt verwendet wird, dargestellt. Fügen Sie ein Suffix oder Präfix zum Namen hinzu, wenn Trimble Survey Controller bereits ein Datum-Gitternetz mit dem gleichen Namen verwendet. Der Name muß den Namen des ursprünglichen Datum-Gitternetzes beinhalten.

HINWEIS: Beim Importieren der Survey Controller-Datei (*.dc) verwendet Trimble Geomatics Office den Survey Controller-Namen, um zu überprüfen, ob der im Feld verwendete Name der .cdg-Datei mit dem Datum-Gitternetz übereinstimmt, das für das Trimble Geomatics Office-Projekt definiert ist. Wenn der Name den Namen des ursprünglichen Datum-Gitternetzes nicht enthält, wird das Datum-Gitternetz nicht erkannt.

6.	Klicken Sie auf OK.

Das Dialogfeld Dateiname erscheint. Der voreingestellte Dateiname besteht aus den ersten sechs Zeichen des Datum-Gitternetz-Namens. Hierbei handelt es sich nicht um den Namen, der in Trimble Survey Controller verwendet wird – es ist der Name der .cdg-Datei, die im Verzeichnis Programme\Gemeinsame Dateien\Trimble\GeoData gespeichert wird.

7.	Zur Angabe eines anderen Namens für die Datei verwenden Sie die Tastatur, um den Dateinamen zu bearbeiten, und klicken Sie dann auf Speichern. Das Dialogfeld Data Transfer Speichern unter erscheint.

8.	Wählen Sie ein Survey Controller-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint. Nachdem die Verbindung hergestellt ist, erscheint das Dialogfeld Speichern.

9.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), um die Datei im Hauptspeicher des Trimble Survey Controllers zu speichern.

  Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Datei auf der PC-Karte speichern möchten.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

10.	Klicken Sie auf Öffnen.

Das von Ihnen gewählte Verzeichnis wird eingelesen. Alle kombinierten Datum-Gitternetz-Dateien im Verzeichnis werden dargestellt. Das Feld Dateiname steht nicht zur Verfügung. Es gibt den Namen des kombinierten Datum-Gitternetzes wieder, der in Trimble Survey Controller erscheint.

11.	Klicken Sie auf Speichern. Das Dialogfeld Sende erscheint. In der Statusleiste wird der Status der Übertragung angezeigt.

Nach dem Abschluß der Übertragung wird das Dialogfeld Sende ausgeblendet und die Verbindung zum Gerät unterbrochen.

Sie können die Datei jetzt inTrimble Survey Controller verwenden.


Eine Geoid-Gitternetz-Datei (.ggf) untergittern und zu Trimble Survey Controller übertragen

 Überblick und weitere Informationen

HINWEIS: Sie können eine Geoid-Gitternetz-Datei nur zur Trimble Survey Controller-Version 6.00 oder höher übertragen.

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Geoid-Datei zu Survey Controller (*.ggf), und klicken Sie auf OK. 	Das Dialogfeld Ein Geoidmodell exportieren erscheint.

3.	Wählen Sie die Option Ein Untergitter eines Geoidmodells für den Export erzeugen, um eine neue Geoid-Gitternetz-Datei zu erzeugen. Klicken Sie auf OK. Das Dialogfeld Geoid-Gitternetz-Datei erzeugen erscheint.

HINWEIS: Wählen Sie die Option Bestehendes Geoidmodell exportieren, um eine bestehende Datei zu exportieren.

Das gelbe Feld auf dem Globus definiert die vom Geoidmodell abgedeckte Fläche. Das Geoidmodell und die Geoid-Gitternetz-Datei werden auf der rechten Seite des Dialogfelds Geoid-Gitternetz-Datei erzeugen festgelegt. Falls das Geoidmodell die gesamte Erdoberfläche abdeckt, ist kein gelbes Feld sichtbar.

4.	Um die Größe der Datei zu verringern, verwenden Sie das Symbol Wählen im linken Bereich des Dialogfelds Geoid-Gitternetz-Datei erzeugen. Ziehen Sie das schwarze Auswahlfeld über die Fläche im gelben Feld, für die Sie die Geoid-Gitternetz-Datei erzeugen möchten.

Die Dateigröße zeigt die Größe an, und die Breitengrad- und Längengradgrenzen zeigen die Ausdehnung der zu erstellenden Geoid-Gitternetz-Datei an.

5.	Im Namensfeld wird der Name des untergitterten Geoidmodells, das im Trimble Survey Controller-Projekt verwendet wird, dargestellt. Fügen Sie ein Suffix oder Präfix zum Namen hinzu, wenn Trimble Survey Controller bereits ein Geoidmodell mit dem gleichen Namen verwendet. Der Name muß den Namen des ursprünglichen Geoidmodells beinhalten.

HINWEIS: Beim Importieren der Survey Controller-Datei (*.dc) verwendet Trimble Geomatics Office den Namen, um zu überprüfen, ob der im Feld verwendete Name der .cdg-Datei mit dem Geoidmodell übereinstimmt, das für das Trimble Geomatics Office-Projekt definiert ist. Vergewissern Sie sich, daß der Dateiname den Namen des ursprünglichen Geoidmodells enthält, sonst wird das Geoidmodell nicht erkannt.

6.	Klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint. Der voreingestellte Dateiname besteht aus den ersten sechs Zeichen des Geoidmodellnamens. Hierbei handelt es sich nicht um den Namen, der in Trimble Survey Controller verwendet wird. Es ist der Name der Geoid-Gitternetz-Datei, die im Verzeichnis Programme\Gemeinsame Dateien\Trimble\GeoData gespeichert wird.

7.	Zur Angabe eines anderen Namens für die Datei verwenden Sie die Tastatur, um das Feld Dateiname zu bearbeiten, und klicken Sie auf Speichern. Das Dialogfeld Data Transfer Speichern unter erscheint.

8.	Wählen Sie ein Survey Controller-Gerät, und klicken Sie auf Öffnen. Dialogfeld Verbinde erscheint. Nachdem die Verbindung hergestellt ist, erscheint das Dialogfeld Speichern unter.

9.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), um die Datei im Hauptspeicher des Trimble Survey Controllers  zu speichern.

  Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Datei auf der PC-Karte speichern möchten.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

10.	Klicken Sie auf Öffnen.

Das von Ihnen gewählte Verzeichnis wird eingelesen. Alle im Verzeichnis enthaltenen Geoid-Gitternetz-Dateien werden dargestellt. Das Feld Dateiname gibt den Namen des Geoid-Gitternetzes wieder, der im Survey Controller erscheint. Das Geoid-Gitternetz erhält denselben Namen, wenn Sie eine .dc-Datei mit Hilfe dieser Datei zu Trimble Geomatics Office übertragen.

11.	Klicken Sie auf Speichern. Das Dialogfeld Sende erscheint. Die Statusleiste zeigt den Status der Übertragung an.

Nach dem Abschluß der Übertragung wird das Dialogfeld Sende ausgeblendet und die Verbindung zum Gerät unterbrochen.

Sie können die Datei jetzt in Trimble Survey Controller verwenden.

HINWEIS: Sie können auch das Grid Factory-Programm verwenden, um Geoidmodell-Dateien zu untergittern. Grid Factory ist Teil der benutzerdefinierten Trimble Geomatics Office-Installationsoption.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller-Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


Eine Geoid-Gitternetz-Datei (.ggf) untergittern und zur TDS Survey Pro CE-Software übertragen

 Überblick und weitere Informationen

HINWEIS: Sie können nur eine Geoid-Gitternetz-Datei zur TDS Survey Pro CE Software Version 4 oder höher übertragen.

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Geoid-Datei zu TDS Survey Pro CE (*.ggf), und klicken Sie auf OK. Das Dialogfeld Ein Geoidmodell exportieren erscheint.

3.	Wählen Sie die Option Ein Untergitter eines Geoidmodells für den Export erzeugen, und klicken Sie auf OK. Das Dialogfeld Geoid-Gitternetz-Datei erzeugen erscheint.

HINWEIS: Wählen Sie die Option Bestehendes Geoidmodell exportieren, um eine bestehende Datei dieses Typs zu exportieren.

Das gelbe Feld auf dem Globus definiert die von dem Geoidmodell abgedeckte Fläche. Das Geoidmodell und die Geoid-Gitternetz-Datei werden auf der rechten Seite des Dialogfelds Datum-Gitternetz-Datei erzeugen festgelegt. Falls das Geoidmodell die gesamte Erdoberfläche abdeckt, ist kein gelbes Feld sichtbar.

4. 	Um die Größe der Datei zu verringern, verwenden Sie das Symbol Wählen im linken Bereich des Dialogfelds Datum-Gitternetz-Datei erzeugen. Ziehen Sie das schwarze Auswahlfeld über die Fläche im gelben Feld, für die Sie die Geoid-Gitternetz-Datei erzeugen möchten.

Die Dateigröße zeigt die Größe, und die Breitengrad- und Längengradgrenzen zeigen die Ausdehnung der zu erstellenden Geoid-Gitternetz-Datei an.

5.	Im Namensfeld wird der Name des untergitterten Geoidmodells angezeigt

HINWEIS: Beim Importieren verwendet Trimble Geomatics Office das Namensfeld, um zu überprüfen, ob der im Feld verwendete Name der .ggf-Datei mit dem Geoidmodell übereinstimmt, das für das Trimble Geomatics Office-Projekt definiert ist. Vergewissern Sie sich, daß der Dateiname den Namen des ursprünglichen Geoidmodells enthält, sonst wird das Geoidmodell nicht erkannt.

6.	Klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint. Der voreingestellte Name enthält die ersten sechs Zeichen des Geoidmodellnamens. Es ist der Name der Geoid-Gitternetz-Datei, die im Verzeichnis Programme\Gemeinsame Dateien\Trimble\GeoData gespeichert wird.

7.	Wenn Sie den Namen der Datei ändern möchten, geben Sie mit der Tastatur einen neuen Namen in das Feld Dateiname ein, und klicken Sie auf Speichern. Das Dialogfeld Data Transfer Speichern unter erscheint.

8.	Wählen Sie das TDS Survey Pro CE-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint. Nachdem eine Verbindung hergestellt wurde, erscheint das Dialogfeld Speichern unter.

9.	Übertragen Sie die Datei zum TDS Survey Pro CE-Gerät.

Sie können die Datei nun in der TDS Survey Pro CE-Software verwenden.

HINWEIS: Sie können auch das Grid Factory-Programm zum Untergittern von Geoidmodell-Dateien verwenden. Grid Factory kann mit der benutzerdefinierten Installationsoption in Trimble Geomatics Office installiert werden.


Daten von der TRIMMAP-Software verwenden

Sie können Daten von Projekten, die mit der TRIMMAP-Software erzeugt wurden, in Trimble Geomatics Office importieren.

1.	Öffnen Sie das Projekt, das Sie mit Trimble Geomatics Office verarbeiten möchten, in der TRIMMAP-Software.

2.	Wählen Sie Hilfsmittel / Importieren/Exportieren / Graphische Schnittstellen. Das Menü Graphische Schnittstellen erscheint.

3.	Wählen Sie Graphische Schnittstellen / Datei erstellen.

4.	Geben Sie einen Projektnamen und einen Namen für die Ausgabedatei ein.

HINWEIS: Stellen Sie im Feld Ausgabedateiname sicher, daß Sie den Namen und den Bereich der zu erstellenden Datei sowie die .tgf-Erweiterung angeben, z. B.  C:\Temp\Topo_pts.tgf.

5.	Wählen Sie in Trimble Geomatics Office Datei / Importieren. Das Dialogfeld Importieren erscheint.

6.	Wählen Sie im Register CAD / ASCII die Option TRIMMAP-Graphikdatei, und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

7.	Navigieren Sie zu dem Ordner, der die .tgf-Datei enthält, und klicken Sie auf Öffnen.

Die Datei wird in Trimble Geomatics Office importiert.


Eine neue Abfrage erzeugen

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank nur mit Trimble Geomatics Office. Trimble unterstützt oder erlaubt weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank mit anderen Softwareanwendungen. Trimble behält sich vor, das Format dieser Datenbank jederzeit zu modifizieren, um es inkompatibel mit anderen Softwareanwendungen zu machen.

 Überblick und weitere Informationen

HINWEIS: Sie benötigen  die Microsoft Access 2000 Software (oder höher), um benutzerdefinierte Abfragen zu definieren.

In diesem Beispiel wird eine Abfrage erzeugt, die alle Datenbankpunkte mit Höhenwerten gleich Null auswählt.

1.	Öffnen Sie in Microsoft Access die Vorlagen- (oder Projekt-) Datenbank von Trimble Geomatics Office, zu der die Abfrage hinzugefügt werden soll. Diese kann im Vorlagen- oder Projektordner gefunden werden (.mdb).

2.	Wählen Sie das Register Abfragen im Hauptgraphikfenster, und klicken Sie dann auf Neu, um eine neue Abfrage zu erzeugen.

TIP: Wählen Sie die Option Entwurfsansicht anstelle des Abfrage-Assistenten.

3.	Wählen Sie die Punktetabelle im Dialogfeld Tabelle anzeigen, da Sie Punktelemente auswählen möchten, und diese alle in dieser Tabelle gespeichert sind.

4.	Klicken Sie auf Hinzufügen, bevor Sie das Dialogfeld schließen.

Ein Dialogfeld Abfrage erscheint.

5.	Stellen Sie die erste Spalte in der Abfragedefinition auf die gesamte Punktetabelle ein. Sie können dies durchführen, indem Sie den *-Bezeichner von der Punktetabelle in den oberen Abschnitt des Dialogfelds ziehen und die Maustaste dort loslassen, oder indem Sie die Option Punkt.* im Feld Feld wählen.

HINWEIS: Gemäß Voreinstellung ist das Kontrollkästchen Anzeigen gewählt. Solange nicht mehrere Elemente von der Abfrage gewählt werden sollen, ist es im allgemeinen vorzuziehen, die gesamte Tabelle auszugeben. Somit kann die Abfrage für andere Zwecke (wie z. B. Berichte) verwendet werden.

6.	Stellen Sie die Einstellung Feld in der zweiten Spalte auf Höhe (den Höhen-Feldbezeichner) ein.

Geben Sie =0 in das Feld Kriterien in dieser Spalte ein. Dadurch wird auf eine Überprüfung auf Höhenwerte durchgeführt, die gleich Null sind.

7.	Sie können jetzt die Funktion dieser Abfrage testen, indem Sie die Datenblattansicht überprüfen. Es werden alle Punkte in der Datenbank mit Null-Höhen in der Tabelle aufgelistet.

8.	Speichern Sie die neue Abfrage, indem Sie sie schließen und mit dem Präfix “Select_” versehen. Bezeichnen Sie diese z. B. als “Select_Points with zero elevations”.

HINWEIS: Um die Abfrage zu den Auswahl-Symbolen des Eigenschaftsfensters hinzuzufügen, verwenden Sie das Präfix “SortSS_” für das Symbol Sortieren, “SvyFilterSS_” für das Symbol Filter (für Vermessungsdaten) und “PlanFilterSS_” für das Symbol Filter (für CAD-Daten). Verwenden Sie das Präfix “Report”, um die Abfrage für einen benutzerdefinierten Bericht zu benutzen.

9.	Bevor die neue Abfrage unter Wählen / Nach Abfrage (und anderswo innerhalb von Trimble Geomatics Office) verfügbar wird, muß die Datenbank-Schema-Datei aktualisiert werden. Verwenden Sie den Microsoft Windows Explorer, um die bestehende Datenbank-Schema-Datei (.dbs) für das Projekt (oder das Vorlagenprojekt) zu löschen.

HINWEIS: Wenn ein Projekt ohne Datenbank-Schema-Datei geöffnet wird, erstellt Trimble Geomatics Office basierend auf der Konfiguration der Datenbank-Datei automatisch eine neue Schema-Datei. Diese neue Schema-Datei enthält die Referenz zu der neu hinzugefügten Abfrage. Die neue Abfrage erscheint unter Wählen / Nach Abfrage. Sie können sie in benutzerdefinierten ASCII-Export- und Berichtsdefinitionen verwenden.

10.	Öffnen Sie Trimble Geomatics Office und die Vorlage oder das Projekt, zu der/dem Sie die Abfrage hinzugefügt haben.

Sie können die neue Abfrage jetzt einsetzen, indem Sie den Befehl Wählen / Nach Abfrage wählen. Ihre neue Abfrage erscheint in der Liste.


Eine Survey Controller-Datei (*.dc) von Trimble Survey Controller importieren

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Vermessungsgeräte, und klicken Sie auf OK. Das Dialogfeld Data Transfer Öffnen erscheint.

3.	Wählen Sie ein Survey Controller-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint.

Nachdem die Verbindung hergestellt ist, erscheint im Feld Suchen im Dialogfeld Öffnen das Survey Controller-Gerät.

4.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), wenn sich die Datei, die Sie importieren, im Hauptspeicher des Trimble Survey Controllers befindet.

 Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Datei, die sich auf der PC-Karte befindet, importieren möchten.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

5.	Klicken Sie auf Öffnen. Das von Ihnen ausgewählte Verzeichnis wird eingelesen. Alle Trimble Survey Controller-Projekte im Verzeichnis werden dargestellt.

6.	Wählen Sie im Feld Dateiformat die von Ihnen verwendete Version der Datenrekorder-Datei.

7.	Wählen Sie die Datei(en), die Sie importieren möchten, und klicken Sie auf Öffnen. Das Dialogfeld Empfange erscheint. Die Statusleiste zeigt den Status der Dateiübertragung an.

Nach dem Abschluß der Übertragung wird das Dialogfeld Empfange ausgeblendet und die Verbindung zum Gerät unterbrochen.

Die Projektdatei wurde in eine .dc-Datei konvertiert und wird in die Projektdatenbank importiert. Die .dc-Datei befindet sich im Ordner Data Files\Trimble Files des Projekts.

HINWEIS: Wenn Sie eine .dc-Datei von einem Gerät, auf dem Trimble Survey Controller ausgeführt wird, zu Trimble Geomatics Office übertragen, wird sie automatisch in das Projekt importiert.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


Eine Trimble GPS-Datei (.dat) in Ihren Computer importieren

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option GPS-Dateien (*.dat), und klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

3.	Finden Sie die .dat-Datei, die Sie importieren möchten, und klicken Sie auf Öffnen.

Das Dialogfeld DAT-Checkin erscheint.

4.	Nehmen Sie die notwendigen Änderungen vor.

Prüfen Sie insbesondere, ob die Antennenhöhe(n) korrekt ist(sind). Durch das Ändern von Werten werden nicht die tatsächlichen Werte in der .dat-Datei geändert. Es werden nur die Werte verändert, die beim Importieren der Datei in Trimble Geomatics Office verwendet werden. Dadurch bleibt die .dat-Datei in ihrem ursprünglichen Zustand erhalten.

5.	Klicken Sie auf OK.

Die importierte Datei befindet sich im Ordner Data Files \Trimble Files des Projekts.

TIP: Sie können die Datei ziehen und ablegen.


Eine Trimble GPS-Datei (.dat) von einem Trimble GPS-Empfänger importieren

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Vermessungsgeräte, und klicken Sie auf OK.

Das Dialogfeld Data Transfer Öffnen erscheint.

3.	Wählen Sie ein GPS-Empfänger-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint.

Nachdem die Verbindung hergestellt ist, erscheint im Feld Suchen in im Dialogfeld Öffnen das GPS-Empfängergerät.

4.	Wählen Sie die Datei(en), die Sie importieren möchten, und klicken Sie auf Öffnen. Das Dialogfeld Empfange erscheint. Die Statusleiste zeigt den Status der Dateiübertragung an.

Nach dem Abschluß der Übertragung wird das Dialogfeld Empfange ausgeblendet und die Verbindung zum Gerät unterbrochen.

Das Dialogfeld DAT-Checkin erscheint.

5.	Nehmen Sie die notwendigen Änderungen vor.

Prüfen Sie insbesondere, ob die Antennenhöhe(n) korrekt ist (sind). Durch das Ändern von Werten werden nicht die tatsächlichen Werte in der .dat-Datei geändert. Es werden nur die Werte verändert, die beim Importieren der Datei in Trimble Geomatics Office verwendet werden. Dadurch bleibt die .dat-Datei in ihrem ursprünglichen Zustand erhalten.

6.	Klicken Sie auf OK.

Die importierte Datei befindet sich im Ordner Data Files \Trimble Files des Projekts.


Eine RINEX-GPS-Datei importieren

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option RINEX-Dateien, und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie die Beobachtungsdatei(en), die Sie importieren möchten. Ändern Sie, falls erforderlich, die Option Dateityp. Klicken Sie auf Öffnen.

Wenn eine entsprechende .nav-Datei mit demselben Namen existiert, wird diese automatisch mit der Beobachtungsdatei verbunden.

Wenn die dazugehörige .nav-Datei nicht denselben Namen hat, erscheint das Dialogfeld Passende Navigationsdatei. Die Beobachtungsdateien werden unter Beobachtungsdateien aufgelistet. Wählen Sie die entsprechende .nav-Datei, und klicken Sie auf OK.

HINWEIS: Jede Beobachtungsdatei muß über eine entsprechende .nav-Datei verfügen. Wenn die korrekte .nav-Datei nicht gewählt ist, wird beim Importieren eine Meldung angezeigt, und es können keine Basislinien verarbeitet werden.

4.	Die Datei(en) werden in das Trimble GPS-Dateiformat konvertiert. Das Dialogfeld DAT-Checkin erscheint.

5.	Nehmen Sie die erforderlichen Änderungen vor.

Prüfen Sie insbesondere, ob die Antennenhöhe(n) und der Empfängertyp korrekt ist(sind). Durch das Ändern von Werten werden nicht die tatsächlichen Werte in der GPS-Datei geändert. Es werden nur die Werte verändert, die beim Importieren der Datei in Trimble Geomatics Office verwendet werden. Dadurch bleibt die GPS-Datei in ihrem ursprünglichen Zustand erhalten.

TIP: Vergewissern Sie sich, daß der Empfänger- und Antennentyp beim Dat-Checkin bekannt sind.

6.	Klicken Sie auf OK.

Die importierte Datei befindet sich im Ordner Data Files\Trimble Files des Projekts.


Ein benutzerdefiniertes Import-/Exportformat erzeugen

 Überblick und weitere Informationen

In diesem Beispiel wird ein benutzerdefiniertes Exportformat definiert. Das Format ist eine Textdatei mit Komma als Trennzeichen, die den Punktnamen (in Großbuchstaben), Hochwert (mit Einheiten), Rechtswert (mit Einheiten) und orthometrische Höhe (mit Einheiten) enthält. Zur Auswahl der gewünschten Felder werden Feldcodes verwendet. Benutzerdefinierte Importformate werden in vergleichbarer Weise definiert.

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Klicken Sie im Register Benutzerdefiniert auf Neues Format. Das Dialogfeld ASCII-Exportformat definieren erscheint.

3.	Geben Sie einen Namen in das Feld Name ein.

4.	Klicken Sie im Feld Formatinhalt auf die rechte Maustaste, und wählen Sie Felder / Name aus dem Verknüpfungsmenü.

[Name] erscheint im Feld Formatinhalt.

5.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Großbuchstaben aus dem Verknüpfungsmenü.

[Name:Großbuchstaben] erscheint im Feld Formatinhalt. Das bedeutet, daß alle Punktnamen in Großbuchstaben exportiert werden.

6.	Geben Sie ein Komma mit anschließender Leertaste ein.

7.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Hochwert aus dem Verknüpfungsmenü.

[Hochwert] erscheint neben dem Komma.

8.	Klicken Sie auf die rechte Maustaste und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Einheiten aus dem Verknüpfungsmenü.

[Hochwert] wird geändert zu [Hochwert:Einheiten]. Das bedeutet, daß die aktuelle Koordinateneinheit in die Datei eingeschlossen wird.

9.	Geben Sie ein Komma mit anschließender Leertaste ein.

10.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Rechtswert aus dem Verknüpfungsmenü.

[Rechtswert] erscheint neben dem Komma.

11.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Einheiten aus dem Verknüpfungsmenü.

[Rechtswert] wird geändert zu [Rechtswert:Einheiten]. Das bedeutet, daß die aktuelle Koordinateneinheit in die Datei eingeschlossen wird.

12.	Geben Sie ein Komma mit anschließender Leertaste ein.

13.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Höhe aus dem Verknüpfungsmenü.

[Höhe] erscheint neben dem Komma.

14.	Klicken Sie auf die rechte Maustaste und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Einheiten aus dem Verknüpfungsmenü.

[Höhe] wird geändert zu [Höhe:Einheiten]. Das bedeutet, daß die aktuelle Koordinateneinheit in die Datei eingeschlossen wird.

15.	Klicken Sie auf OK, um das Exportformat zu speichern. Das Dialogfeld Exportieren erscheint. Das von Ihnen erstellte Format erscheint in der Liste im Register Benutzerdefiniert.

16.	Um Daten in diesem Format zu exportieren, wählen Sie das Format, und klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

17.	Geben Sie einen Namen für die Exportdatei in das Feld Dateiname ein, und klicken Sie auf	Speichern, um die Datei zu erzeugen.


Eine Survey Controller-Datei (*.dc) zu Trimble Survey Controller exportieren

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Vermessungsgeräte.

3.	Klicken Sie auf Optionen, um die Projekteinstellungen für die Datei zu wählen. Klicken Sie im Dialogfeld, das erscheint, auf OK, um alle Änderungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

5.	Klicken Sie auf OK. Das Dialogfeld Data Transfer Speichern unter erscheint.

6.	Wählen Sie ein Trimble Survey Controller-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint.

7.	Nachdem eine Verbindung hergestellt ist, erscheint das Dialogfeld Speichern unter.

8.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), um die Datei im Hauptspeicher des Trimble Survey Controllers zu speichern.

  Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Datei auf der PC-Karte speichern möchten.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

9.	Klicken Sie auf Öffnen.

Der von Ihnen gewählte Ordner wird eingelesen. Es werden alle Survey-Controller-Dateien im Ordner dargestellt. Der Name des Trimble Geomatics Office-Projekts erscheint im Feld Dateiname. Dies ist der Name des Trimble Survey Controller-Projekts, das zu Trimble Survey Controller exportiert werden soll. Sie können diesen Namen, falls erforderlich, bearbeiten.

10.	Klicken Sie auf Speichern. Das Dialogfeld Sende erscheint. Die Statusleiste zeigt den Status der Übertragung an. Nach dem Abschluß der Übertragung wird das Dialogfeld Sende ausgeblendet und die Verbindung zum Gerät unterbrochen.

Sie können die Datei jetzt in Trimble Survey Controller verwenden.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller-Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


AutoCAD-Dateien (*.dxf) exportieren

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register CAD / ASCII die Option AutoCAD-Dateien (*.dxf, *.dwg).

3.	Klicken Sie auf Optionen, um die.dxf-Version und den Typ, zu dem Sie exportieren möchten, zu konfigurieren.

4.	Klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

5.	Navigieren Sie zu dem Ordner, in dem Sie die Datei speichern möchten.

6.	Geben Sie den Namen für die Datei ein, und klicken Sie auf Speichern.

Die Datei wird erzeugt.

Gemäß Voreinstellung exportiert Trimble Geomatics Office den Punktnamen als Punktattribut. Bearbeiten Sie die DXF/DWG-Attributblockdefinitionen in der Datei Options.ini, wenn Sie andere Punktinformationen exportieren möchten.

HINWEIS: Sie können diese Schritte benutzen, um eine Drawing-Datei (*.dwg) zu exportieren. Klicken Sie im Schritt 4 auf Optionen, um das .dwg-Format und die Version zu konfigurieren.


Die Einheiten für ein Projekt ändern

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie im Register Einheiten und Format das Feld, dessen Einheiten und Format Sie ändern möchten.

3.	Wählen Sie die gewünschte Option aus der Liste, und klicken Sie auf OK, um die Änderungen anzuwenden.


Ein Projekt für Attribute einrichten

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie im Register Merkmale das Kontrollkästchen Attribute verwenden. Das Feld Bibliothek wird verfügbar.

 3.	Klicken Sie auf Durchsuchen, um die von Ihnen gewünschte Merkmals- und Attributbibliothek-Datei (*.fcl) oder Attribut-Verzeichnisdatei (*.ddf) zu finden.

4.	Klicken Sie auf OK. Die von Ihnen ausgewählte Datei wird verwendet, um Datenbanktabellen für jeden Kartiercode mit Attributen zu erzeugen. Sie können jetzt die .dc-Dateien mit Attributen importieren.


Eine gespeicherte örtliche Anpassung als Koordinatensystem eines Projekts wählen

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Koordinatensystem.

 3.	Klicken Sie in der Gruppe Koordinatensystem-Einstellungen auf Ändern. Das Dialogfeld Koordinatensystem wählen erscheint.

4.	Wählen Sie Neues System, und klicken Sie auf Weiter. Das Dialogfeld Koordinatensystemtyp wählen erscheint.

 5.	Wählen Sie Kalibrierte Örtliche Anpassung, und klicken Sie auf Weiter. Das Dialogfeld Kalibrierte Örtliche Anpassung wählen erscheint.

6.	Wählen Sie die gewünschte örtliche Anpassung, und klicken Sie auf Fertig stellen.

Das Koordinatensystem wird auf die Datenbank angewendet. Alle bestehenden Punkte in der Datenbank werden in das neue Koordinatensystem konvertiert. Informationen zum Konvertierungsvorgang finden Sie unter dem Thema Koordinatensysteme − Überblick.

Wenn Sie Punktpositionen haben oder Koordinaten mit der Höhe NULL in Ihr Projekt eingeben, und keine voreingestellte Höhe definiert ist, wird die Auswahl des Koordinatensystems fehlschlagen, da Trimble Geomatics Office bestehende Punkte nicht aus einem System in ein anderes konvertieren kann.


Attribute exportieren

 Überblick und weitere Informationen

Sie können eine Datei importieren, die folgendes enthält:

  alle Punkte mit einem bestimmten Merkmal

  alle Attribute

So exportieren Sie separate Dateien für jedes Merkmal:

1.	Wählen Sie Punkte, die das gewünschte Merkmal aufweisen.

2.	Konfigurieren Sie ein benutzerdefiniertes Exportformat.


Die Punkte, die die entsprechenden Merkmale enthalten, auswählen

So wählen Sie die Punkte aus:

1.	Wählen Sie in der Planansicht Wählen / Nach Punktmerkmal.

Wenn Sie z. B. über alle Baumattribute berichten möchten, wählen Sie “Baum” im Dialogfeld Nach Punktmerkmal auswählen.

2.	Klicken Sie auf OK.

Alle Punkte mit dem von Ihnen gewählten Kartiercode werden jetzt ausgewählt.


Ein benutzerdefiniertes Berichtsformat konfigurieren

So konfigurieren Sie das Format:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Klicken Sie im Register Benutzerdefiniert auf Neues Format. Das Dialogfeld ASCII-Exportformat definieren erscheint.

3.	Geben Sie einen Namen für das Exportformat in das Feld Name ein.

4.	Geben Sie eine Beschreibung des Exportformats in das Feld Beschreibung ein. Eine Beschreibung ist nicht obligatorisch für das Format.

5.	Stellen Sie sicher, daß die Option Punktinformation im Feld Exportieren von ausgewählt ist, da Sie über Punkte berichten.

6.	Klicken Sie auf Format automatisch ausfüllen, um alle Felder aus der Punktetabelle im Formatkopf und Formatinhalt auszufüllen.

7.	Wenn das Dialogfeld Format hinzufügen erscheint, wählen Sie die entsprechenden Trennzeichen, die für das Format erforderlich sind.

8.	Löschen Sie alle Infos und Felder, die Sie nicht in das Format einschließen möchten.

9.	Fügen Sie alle Attributinfos, die Sie in das Berichtsformat einschließen möchten, in der Liste Formatkopf hinzu.

10.	Die Attribut-Datensätze werden nicht in der Punktetabelle gespeichert. Fügen Sie die Felder, die in das Format eingeschlossen werden sollen, aus der entsprechenden Merkmalstabelle hinzu. Klicken Sie in der Liste Formatinhalt auf die rechte Maustaste, um auf diese Felder zuzugreifen, und wählen Sie aus dem Verknüpfungsmenü.

11.	Wählen Sie Felder / Fortgeschritten / Attribute.

Es werden alle Kartiercodes mit Attributen (in der Merkmals- und Attributbibliothek, die zum Einrichten des Projekts mit Attributen verwendet wurde) eingeblendet.

12.	Wählen Sie den gleichen Kartiercode wie zuvor (z. B. “Baum”). Die Attribute erscheinen in einem weiteren Untermenü.

13.	Wählen Sie das Attribut, über das Sie berichten möchten.

Das von Ihnen gewählte Attribut erscheint im Feld Formatinhalt.

HINWEIS: Wenn Sie über alle Attribute eines bestimmten Merkmals berichten möchten, wählen Sie im Verknüpfungsmenü die Option Stern (*). Alle Attribute werden zum Formatinhalt hinzugefügt.

14.	Wiederholen Sie die vorstehenden Schritte für jedes Attribut, das Sie exportieren möchten.

15.	Vervollständigen Sie das Berichtsformat, und klicken Sie auf OK. Das Format wird zur Liste Benutzerdefiniert hinzugefügt.

16.	Heben Sie das Format hervor, und klicken Sie auf OK, um eine Datei in diesem Format zu exportieren.


Eine einzelne Datei mit allen Attributen exportieren

So exportieren Sie die Datei:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register GIS die Option Name, Breite, Länge,EllH, Alle Attribute (Örtlich) oder die Option Name, Hochw, Rechtsw,Höhe, Alle Attribute.

3.	Klicken Sie auf OK.

4.	Das Dialogfeld Speichern unter erscheint. Geben Sie einen Dateinamen und Pfad an, und klicken Sie auf OK.

Eine Datei mit Attributen wird erstellt.


Eine Survey Controller-Datei (*.dc) mit Attributen importieren

 Überblick und weitere Informationen

HINWEIS: Um Attribute in Trimble Geomatics Office verwenden zu können, müssen Sie zuerst ein Projekt für Attribute einrichten.

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Survey Controller-Dateien (*.dc), und klicken Sie auf OK.

Trimble Geomatics Office prüft, ob die Merkmals- und Attributbibliothek-Datei (*.fcl) oder Attribut-Verzeichnisdatei (*.ddf), die im aktuellen Trimble Geomatics Office-Projekt angegeben ist, mit der in der .dc-Datei übereinstimmt.

Falls sie sich unterscheiden, haben Sie folgende Möglichkeiten:

  Brechen Sie den Import ab.

  Importieren Sie alle Punkte und Attributinformationen, die vom aktuellen Trimble Geomatics Office-Projekt erkannt werden. Sie werden gewarnt, daß Sie eventuell Daten verlieren können. Der Import-Bericht beschreibt, welche Attributinformationen nicht importiert wurden.

  Importieren Sie nur Punkte (Es werden keine Attributinformationen importiert).

Wenn die Merkmals- und Attributbibliothek nicht im aktuellen Trimble Geomatics Office-Projekt definiert ist, können Sie die .dc-Datei ohne Attributinformationen importieren oder das Importieren abbrechen.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller-Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


Einen Layer hinzufügen

 Überblick und weitere Informationen

1.	Führen Sie in der Planansicht einen der folgenden Schritte aus:

  Wählen Sie Bearbeiten / Layer.

  Klicken Sie auf das Symbol Layer bearbeiten.

Das Dialogfeld Layer erscheint.

2.	Klicken Sie auf Neu. Eine neue Reihe erscheint im Dialogfeld Layer.

3.	Geben Sie in das Feld Name einen eindeutigen Namen für den neuen Layer ein.

4.	Wählen Sie einen Standardpunktstil aus der Liste. Dieser Punktstil wird für alle Punkte verwendet, für die im Feld Punktstil die Option <Nach Layer> gewählt wurde.

5.	Wählen Sie einen Standardlinienstil aus der Liste.

Dieser Linienstil wird für alle Linien, Bögen und Kurven verwendet, für die im Feld Linienstil die Option <Nach Layer> gewählt wurde.

6.	Wählen Sie einen Textstil aus der Liste.

Dieser Textstil wird für jeden Text verwendet, für den im Feld Textstil die Option <Nach Layer> gewählt wurde.

7.	Aktivieren Sie das Kontrollkästchen Sichtbar, wenn alle Elemente in dem Layer dargestellt werden sollen.

8.	Deaktivieren Sie das Kontrollkästchen Gesperrt, damit Sie die Elemente in dem Layer auswählen können.

9.	Klicken Sie auf OK.


Punkte mit doppelten Namen kombinieren

 Überblick und weitere Informationen

Sie können doppelte Punkte in Trimble Geomatics Office kombinieren, wenn Sie sicher sind, daß es sich um den gleichen Punkt handelt, und Sie sie nicht als getrennte Punkte benötigen.

ACHTUNG: Zwei Punkte, die dieselben Namen, aber sehr unterschiedliche Daten haben, können auf einen Fehler zurückzuführen sein. Wenn diese Punkte kombiniert werden, kann dies zu unerwarteten Resultaten führen.

1.	Vergewissern Sie sich, daß es sich um denselben Punkt handelt. Wählen Sie dazu Wählen / Doppelte Punkte / Nach Name und Strecke.

2.	Geben Sie eine Abstandsstrecke ein, und klicken Sie auf OK.

3.	Wählen Sie Bearbeiten / Doppelte Punkte kombinieren.

Trimble Geomatics Office kombiniert alle Beobachtungen zu den Punkten und alle eingegebenen Positionen für die Punkte. In der Statusleiste wird eine Zusammenfassung des Kombiniervorgangs angezeigt.


Festlegen, wie doppelte Punkte beim Importieren gehandhabt werden

 Überblick und weitere Informationen

Gemäß Voreinstellung kombiniert Trimble Geomatics Office Punkte gleichen Namens beim Importieren, so daß keine doppelten Punkte erstellt werden. Sie können die horizontale und/oder vertikale Toleranz festlegen, innerhalb der die Software Punkte kombinieren soll, oder Sie können im Dialogfeld Optionen doppelte Punkte einstellen, daß die Software beim Importieren keine doppelte Punkte kombinieren soll.

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Klicken Sie auf Optionen. Das Dialogfeld Optionen doppelte Punkte erscheint.

Führen Sie einen der folgenden Schritte aus:

  Vergewissern Sie sich, daß die Option Doppelte Punkte immer kombinieren gewählt ist.

  Wählen Sie die Option Doppelte Punkte innerhalb der Toleranz kombinieren, und geben Sie die entsprechenden Toleranzen ein.

  Wenn die Software beim Importieren keine doppelten Punkte kombinieren soll, wählen Sie die Option Doppelte Punkte innerhalb der Toleranz kombinieren, und geben Sie einen Wert von 0,02 für die horizontale Toleranz ein (die horizontale Toleranz für die Vermessungsqualität). Geben Sie einen Wert von 0,050 für die vertikale Toleranz ein (die vertikale Toleranz für die Vermessungsqualität).

HINWEIS: Wenn Sie keine Toleranz angeben (die Kontrollkästchen Horizontal und Vertikal in der Gruppe Toleranzen nicht gewählt sind) werden die doppelten Punkte kombiniert.

HINWEIS: Wenn Sie die Toleranz auf 0,000 einstellen, müssen die Koordinaten der doppelten Punkte identisch sein, damit die Punkte kombiniert werden können.

Diese Einstellungen werden auf alle Import-Optionen angewendet, unabhängig davon, ob Sie Dateien unter Verwendung der Projektleiste importieren oder die Dateien in ein Trimble Geomatics Office Projekt ziehen und ablegen. Die Software verwendet die zuletzt von Ihnen angegebenen Einstellungen für doppelte Punkte.


Doppelte Punkte umbenennen

 Überblick und weitere Informationen

Verwenden Sie diesen Vorgang, um doppelte Punkte umzubenennen, wenn z. B. zwei Feldteams die gleichen Namen für verschiedene Punkte in getrennten Survey Controller-Dateien (*.dc) verwendet haben:

1.	Importieren Sie die Dateien unter Verwendung der Option Doppelte Punkte innerhalb der Toleranz kombinieren im Dialogfeld Optionen doppelte Punkte. Stellen Sie die horizontale Toleranz auf 0,02 und die vertikale Toleranz auf 0,050 ein.

HINWEIS: Falls Sie erst nach dem Importieren der Daten feststellen, daß doppelte Punkte existieren, machen Sie den Importvorgang rückgängig. Stellen Sie im Dialogfeld Optionen doppelte Punkte für die Option Doppelte Punkte innerhalb der Toleranz kombinieren die horizontale Toleranz auf 0,02 ein (die horizontale Toleranz für  Vermessungsqualität). Stellen Sie die vertikale Toleranz auf 0,050 ein (die vertikale Toleranz für Vermessungsqualität), und importieren Sie die Daten erneut.

2.	Wählen Sie die Auswahlmenge der Survey Controller-Datei (*.dc), mit der die doppelten Punkte zur Datenbank hinzugefügt wurden. Alternativ können Sie auch Wählen / Doppelte Punkte / Nach Name wählen.

3.	Wählen Sie Bearbeiten / Umbenennen. Das Dialogfeld Umbenennen erscheint.

4.	Geben Sie den neuen Namen des ersten Punktes in der Auswahl ein.

Trimble Geomatics Office benennt alle Punkte in der Auswahlmenge um. Die Punkte werden nach dem dieser Auswahlmenge zugeordneten Startwert umbenannt.

Nehmen Sie z. B. an, daß Sie fünf Punkte ausgewählt haben. Wenn Sie den Namen des ersten Punktes mit dem Namen “2000” ersetzen, werden die verbleibenden vier Punkte zu 2001, 2002, 2003 und 2004 umbenannt.


Punkte mit benutzerdefinierten Beschriftungen bezeichnen

 Überblick und weitere Informationen

In diesem Beispiel werden Punkte mit Hilfe der benutzerdefinierten Beschriftung mit einer Punktbeschreibung bezeichnet.

1.	Verwenden Sie den Microsoft Windows Explorer, um die Datei Options.ini für die Projektvorlage oder das Projekt zu finden, zu dem Sie die benutzerdefinierte Beschriftungsoption hinzufügen möchten.

2.	Verwenden Sie einen Text-Editor, um die Datei Options.ini zu öffnen.

3.	Suchen Sie die Überschrift:

[Labels]

4.	Verwenden Sie die Tastatur, um unmittelbar hinter der letzten Beschriftungsoption den folgenden Text einzugeben:

|X|[Y]

wobei ‘X’ den Namen der Beschriftung und ‘Y’ den Feldcode definiert, mit dem Sie den Punkt beschriften möchten.

5.	Öffnen Sie die Projektvorlage oder das Projekt in Trimble Geomatics Office.

6.	Wählen Sie Ansicht / Punktbeschriftungen. Das Dialogfeld Punktbeschriftungen erscheint. Die neue Option ist in der Liste enthalten.

7.	Wählen Sie die gewünschte Option, und klicken Sie auf OK.


Elemente anmerken

 Überblick und weitere Informationen

1.	Wählen Sie die Punkte, Linien oder Bögen aus, die Sie anmerken möchten. Verwenden Sie hierzu:

  die Maus

  das Menü Wählen

2.	Wählen Sie Einfügen / Anmerkungen. Das Dialogfeld Anmerken erscheint.

3.	Wählen Sie das gewünschte Muster aus der Liste.

4.	Klicken Sie auf Muster, um Anmerkungsmuster zu bearbeiten.

 Aktivieren Sie das Kontrollkästchen Bestehende Anmerkungen beibehalten, um bestehende Anmerkungen beizubehalten.

  Deaktivieren Sie das Kontrollkästchen Bestehende Anmerkungen beibehalten, um bestehende Anmerkungen vor dem Anwenden der neuen Anmerkungen zu entfernen.

5.	Wenn Sie eine Gruppe von anzumerkenden Elementen gewählt haben, überprüfen Sie, ob die Gruppe Anmerken auf Auswahl eingestellt ist.

Wenn Sie die gesamte Datenbank anmerken möchten, wählen Sie die Option Ganze Datenbank.

Wenn keine Elemente ausgewählt sind, ist die Gruppe Anmerken nicht verfügbar, und die ganze Datenbank wird angemerkt.

6.	Klicken Sie auf OK, um die Anmerkungen anzuwenden.

Die Anmerkungen werden zur Datenbank hinzugefügt und erscheinen im Graphikfenster.


Eine Auswahlmenge erstellen

 Überblick und weitere Informationen

1.	Wählen Sie die Elemente aus (Punkte, Linien, Beobachtungen, Kurven, Bögen, Text, Anmerkungen), die Sie in die Auswahl einschließen möchten. Verwenden Sie hierzu:

  die Maus

  das Menü Wählen

2.	Wählen Sie Wählen / Auswahlmengen / Speichern. Das Dialogfeld Speichern erscheint.

3.	Geben Sie einen Namen für die Auswahlmenge ein, und klicken Sie auf OK.

Die Auswahlmenge erscheint in der Liste der gespeicherten Auswahlmengen, wenn Sie Wählen / Auswahlmengen / Laden wählen. Sie erscheint zudem in der Liste der kürzlich verwendeten Auswahlmengen, wenn Sie Wählen / Auswahlmengen wählen.

TIP: Verwenden Sie das Dialogfeld Ansicht Filter, um die Auswahlmengen anzusehen.


Eine GPS-Kalibrierung durchführen

 Überblick und weitere Informationen

Sie müssen möglicherweise aus einem der nachstehend aufgeführten Gründe eine GPS-Kalibrierung in Trimble Geomatics Office durchführen:

  um eine Kalibrierung zu Trimble Survey Controller zu übertragen

  weil Sie im Feld keine Kalibrierung durchgeführt haben

  um einen Bericht für Qualitätskontrolldatensätze zu erstellen.

  um zusätzliche Punkte zu einer in Trimble Survey Controller durchgeführten Kalibrierung hinzuzufügen


Eine GPS-Kalibrierung vorbereiten

Bevor Sie eine GPS-Kalibrierung durchführen, vergewissern Sie sich, daß die Koordinaten für jeden Kalibrierungspunkt von terrestrischen (Gitter-) oder GPS-Daten (WGS-84) abgeleitet wurden.

Wenn Sie eine Kalibrierung in Trimble Survey Controller durchgeführt haben, und die Gitter- und GPS-Punkte denselben Namen haben, könnten diese Punkte beim Importieren kombiniert worden sein. Die kombinierten Punkte werden automatisch auseinandergezogen, wenn Sie eine GPS-Kalibrierung in Trimble Geomatics Office durchführen. Wenn dies geschieht, erscheint eine Meldung, daß derselbe Name für GPS- und Gitterpunkte in der Software verwendet wurde.

Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf Ja, um einen GPS-Punkt und einen getrennten Gitterpunkt gleichen Namens in der Datenbank zu erzeugen.

  Klicken Sie auf Abbrechen, wenn Sie keine GPS-Kalibrierung durchführen oder die Punkte manuell auseinanderziehen möchten. Wenn Sie Punkte manuell auseinanderziehen, haben Sie die Möglichkeit, die GPS-Punkte umzubenennen.


Eine GPS-Kalibrierung durchführen

1.	Wählen Sie Vermessung / GPS-Kalibrierung. Das Dialogfeld GPS-Kalibrierung erscheint.

2.	Wählen Sie die Kalibrierungsparameter, die Sie berechnen möchten, in der Gruppe Kalibrierungskomponenten.

3.	Klicken Sie auf Punktliste. Das Dialogfeld GPS-Kalibrierung - Punktliste erscheint.

4.	Verwenden Sie das Dialogfeld GPS-Kalibrierung - Punktliste, um Ihre Punktpaare (GPS-Punkt und Gitterpunkt) für die Kalibrierung auszuwählen. Es kann derselbe Punkt oder ein anderer Punkt gleichen Namens sein, solange diese Punkte über unterschiedliche GPS- und Gitterwerte verfügen.

5.	Führen Sie einen der folgenden Schritte mit dem ersten GPS-Punkt aus, den Sie bei der Kalibrierung benötigen:

  Verwenden Sie die graphische Auswahl, um den Punkt auszuwählen.

  Geben Sie den Namen des Punkts mit Hilfe der Tastatur ein.

Es erscheint ein Kästchen um den GPS-Punkt im Graphikfenster.

HINWEIS: Wenn ein entsprechender Gitterpunkt gleichen Namens existiert, wird die Punktliste automatisch ausgefüllt.

6.	Führen Sie einen der folgenden Schritte aus, um den Gitterpunkt, der mit dem von Ihnen ausgewählten GPS-Punkt verknüpft ist, einzugeben:

  Verwenden Sie die graphische Auswahl, um den Punkt auszuwählen.

  Geben Sie den Namen des Punkts mit Hilfe der Tastatur ein.

Es erscheint ein Kreuz auf dem Gitterpunkt im Graphikfenster, und ein neuer Eintrag wird im Dialogfeld GPS-Kalibrierung - Punktliste hinzugefügt.

Das Feld Typ wird aktualisiert und gibt an, ob der ausgewählte Punkt über eine horizontale oder vertikale Koordinatenkomponente (oder beide) verfügt. Wenn es keine gemeinsamen Koordinatenkomponenten gibt, wird im Feld Typ Ignoriert angezeigt, und die Koordinaten werden nicht verwendet.

7.	Wiederholen Sie die beiden vorstehenden Schritte, um alle Punktpaare auszuwählen, die Sie bei der Kalibrierung benötigen.

8.	Wenn Sie alle Punktpaare ausgewählt haben, klicken Sie auf OK, um zum Dialogfeld GPS-Kalibrierung zurückzukehren.

HINWEIS: Die Kalibrierungsstatistik erscheint im unteren Teil des Dialogfelds GPS-Kalibrierung - Punktliste, und wird nach der Eingabe eines gültigen Punktpaares berechnet. Verwenden Sie diese Statistik, um inkorrekte Punktpaare zu identifizieren.

9.	Klicken Sie auf Berechnen, um die Kalibrierungsparameter zu berechnen. Die Ergebnisse der Kalibrierung erscheinen in der Gruppe Berechnungszusammenfassung.

10.	Wenn die Ergebnisse außerhalb der erwarteten Bereiche liegen, verwenden Sie den GPS-Kalibrierungsbericht, um nach eventuellen großen Restwerten zwischen Punktpaaren zu suchen. Klicken Sie auf Bericht, um den GPS-Kalibrierungsbericht zu erstellen. Der Bericht wird im voreingestellten HTML-Anzeigemodul dargestellt.

11.	Überprüfen Sie die Restwerte im Berichtabschnitt Verbleibende Differenzen zwischen GPS und bekannten Koordinaten. Entfernen Sie, wenn notwendig, alle unzuverlässigen Punktpaare, und wenden Sie die Kalibrierung erneut an.

12.	Klicken Sie auf OK, um die Kalibrierung auf das Projekt anzuwenden.

Das Koordinatensystem wird mit den Kalibrierungsparametern aktualisiert.


Kartiercodes verarbeiten

 Überblick und weitere Informationen

1.	Wählen Sie Wählen / Auswahlmengen / Laden. Das Dialogfeld Laden erscheint.

2.	Wählen Sie die Auswahlmenge, die den gleichen Namen hat wie die zu verarbeitende Datei (die Datei, in der die Kartiercodes erfaßt wurden). Diese Auswahlmenge wurde automatisch beim Importieren der Datei erzeugt und enthält einen Datensatz mit der Reihenfolge, in der die Punkte im Feld erfaßt wurden. Durch die Verwendung dieser Auswahlmenge stellen Sie sicher, daß Kartiercodes in der richtigen Reihenfolge verarbeitet werden.

3.	Wählen Sie Hilfsmittel / Kartiercodes verarbeiten. Das Dialogfeld Kartiercodes verarbeiten erscheint.

4.	Wählen Sie die Bibliothek, die Sie zur Verarbeitung der Kartiercodes benötigen, und klicken Sie auf OK.

Trimble Geomatics Office verarbeitet die Kartiercodes. Die verarbeiteten Kartiercodes erscheinen im Graphikfenster.


Richtungswinkel/Strecke ansehen

 Überblick und weitere Informationen

So bestimmen Sie Richtungswinkel/Strecke zwischen zwei Projektpunkten:

1.	Wählen Sie Vermessung / Richtungswinkel/Strecke. Das Dialogfeld RIWI/Strecke erscheint.

Der Mauszeiger wird zum Zeiger der graphischen Auswahl.

2.	Klicken Sie auf den ersten Punkt, den Sie für die Berechnung von Richtungswinkel/Strecke benötigen. Der Punktname erscheint im Feld Von im Dialogfeld RIWI/Strecke.

3.	Klicken Sie auf den zweiten Punkt, den Sie für die Berechnung von Richtungswinkel/Strecke benötigen. Wenn der Mauszeiger über einem Punkt positioniert ist, erscheint eine gestrichelte Linie.

Der Punktname erscheint im Feld Zu im Dialogfeld RIWI/Strecke. Die Werte von Richtungswinkel/Strecke werden automatisch in der Gruppe RIWI/Strecke angezeigt.

HINWEIS: Wenn Sie die Punkte mit Hilfe der Tastatur in die Felder eingeben, klicken Sie zur Berechnung von Richtungswinkel/Strecke auf Berechnen.

4.	Klicken Sie auf Detailliert, um zusätzliche Informationen zu dieser Berechnung anzusehen. Die Gruppe Details wird am unteren Rand des Dialogfelds hinzugefügt und stellt zusätzliche Informationen über Richtungswinkel/Strecke dar.

5.	Klicken Sie auf Zu Bericht senden, um einen Bericht über Richtungswinkel/Strecke zu erzeugen. Abhängig von der verwendeten Darstellungsoption (Kurz oder Detailliert) wird ein kurzer oder detaillierter Bericht erzeugt.

6.	Klicken Sie auf Bericht anzeigen, um den Bericht im HTML-Anzeigemodul anzusehen.

7.	Um einen anderen Richtungswinkel/Strecke anzusehen, klicken Sie in die Punktfelder, und wählen Sie die Punkte erneut.


Flächen messen

Verwenden Sie das Hilfsmittel Messen, um den Azimut und die Strecke zwischen den beiden zuletzt gewählten Positionen und die Fläche anzusehen, die mit den im aktuellen Meßvorgang ausgewählten Positionen erzeugt wurde.

1.	Wählen Sie Vermessung / Messen. Das Dialogfeld Messen erscheint.

2.	Klicken Sie auf die erste Position (die kein Punkt sein muß) im Graphikfenster.

3.	Klicken Sie auf weitere Positionen im Graphikfenster. Bei jeder Auswahl einer Position werden die Koordinaten zur Berechnung der Felder des Dialogfelds Messen verwendet. Es erscheint eine Linie, die die gewählten Punkte verbindet.

Die Felder im Dialogfeld Messen werden jedes Mal aktualisiert, wenn Sie auf eine neue Position klicken. Die Werte werden nicht in der Datenbank gespeichert.

4.	Klicken Sie auf Zurücksetzen, um die Werte zu löschen.


Eine Koordinatentransformation durchführen

 Überblick und weitere Informationen

Verwenden Sie eine Koordinatentransformation, um ausgewählte Punkte zu verschieben und/oder zu rotieren. Dieses Beispiel veranschaulicht, wie Sie alle Punkte in der Datenbank durch die Eingabe bekannter Koordinaten für einen bestehenden Punkt transformieren.

1.	Wählen Sie die Punkte, die Sie verschieben oder rotieren möchten.

2.	Wählen Sie Vermessung / Koordinatentransformation. Das Dialogfeld Koordinatentransformation erscheint.

3.	Klicken Sie auf Punktliste. Das Dialogfeld Koordinatentransformation – Punktliste erscheint.

4.	Führen Sie einen der folgenden Schritte aus:

  Geben Sie den bestehenden Punktnamen im Feld Punkt ein.

  Verwenden Sie die graphische Auswahl zur Auswahl des Punkts.

Die Felder Punkt, Aktueller Hochwert und Aktueller Rechtswert werden ausgefüllt, und das Feld Bekannter Hochwert ist aktiviert.

5.	Führen Sie einen der folgenden Schritte in den Feldern Bekannter Hochwert und Bekannter Rechtswert aus:

  Geben Sie den bekannten Hochwert und Rechtswert für den Punkt ein.

  Verwenden Sie die graphische Auswahl, um den bekannten Hochwert und Rechtswert des Punkts zu wählen.

Eine Linie erscheint im Graphikfenster, die den Unterschied zwischen den aktuellen und bekannten Koordinaten anzeigt.

In der Gruppe Statistik werden der Maßstabsfaktor und der maximale horizontale Restwert angezeigt. Verwenden Sie diese Werte, um schlechte Punktpaare zu identifizieren.

6.	Klicken Sie auf OK. Es erscheint ein Dialogfeld, in dem die Restwert-Fehler dargestellt werden.

7. 	Das Dialogfeld Koordinatentransformation wird wieder eingeblendet. Die Werte, die für aktuelle und bekannte Koordinaten berechnet wurden, werden in die Felder Ho-Verschiebung und Re-Verschiebung eingetragen.

8.	Klicken Sie auf OK, um die Koordinatentransformation auf die ganze Datenbank anzuwenden.

HINWEIS: Sie können eine Koordinatentransformation rückgängig machen.


Eine Höhenausgleichung durchführen

 Überblick und weitere Informationen

Verwenden Sie eine Höhenausgleichung, um die orthometrischen Höhen für ausgewählte Punkte auszugleichen. Dieses Beispiel veranschaulicht, wie Sie die Höhen aller Punkte in der Datenbank durch die Eingabe einer bekannten Höhe für einen bestehenden Punkt ausgleichen.

1.	Wählen Sie Vermessung / Höhenausgleichung. Das Dialogfeld Höhenausgleichung erscheint.

2.	Klicken Sie auf Punktliste. Das Dialogfeld Höhenausgleichung – Punktliste erscheint.

3.	Führen Sie einen der folgenden Schritte aus:

  Geben Sie den bestehenden Punktnamen im Feld Punkt ein.

  Verwenden Sie die graphische Auswahl zur Auswahl des Punkts.

Ein Kästchen erscheint über dem ausgewählten Punkt.

Die Felder Punkt, Aktueller Hochwert, Aktueller Rechtswert und Aktuelle Höhe werden ausgefüllt.

4.	Führen Sie einen der folgenden Schritte aus:

  Geben Sie die bekannte Höhe für den Punkt in das Feld Bekannte Höhe ein.

  Verwenden Sie die graphische Auswahl, um die Höhe eines anderen Punkts auszuwählen.

In der Gruppe Statistik werden der Maßstabsfaktor, die maximale Ausgleichungsneigung und der maximale vertikale Restwert angezeigt. Verwenden Sie diese Werte, um schlechte Punktpaare zu identifizieren.

5.	Klicken Sie auf OK, um zum Dialogfeld Höhenausgleichung zurückzukehren.

Das Dialogfeld Höhenausgleichung wird wieder eingeblendet.

Die Koordinaten des ersten verwendeten Punkts werden in die Felder Ursprung Ho und Ursprung Re eingetragen. Die berechnete Höhenausgleichung wird in das Feld Korrektur-Konstante eingetragen. Die Felder Korrektur pro Ho-Einheit und Korrektur pro Re-Einheit werden nur ausgefüllt, wenn mehr als ein Punkt zur Definition der Höhenausgleichung verwendet wird.

6.	Klicken Sie auf OK, um die Höhenausgleichung auf die ganze Datenbank anzuwenden.

HINWEIS: Sie können eine Höhenausgleichung rückgängig machen.


Feldcodes verwenden

 Überblick und weitere Informationen

Verwenden Sie Feldcodes zur Darstellung der Werte von:

  Feldern

  Variablen in Anmerkungen, Berichten, Exportformaten, Text

Feldcodes sind zudem nützlich bei der Definition von Berichten und Exportformaten. Dieses Beispiel veranschaulicht, wie Sie Feldcodes zur Definition eines Exportformats verwenden. Das Format definiert eine Textdatei mit Komma als Trennzeichen, die den Punktnamen (in Großbuchstaben), Hochwert (mit Einheiten), Rechtswert (mit Einheiten) und die Höhe (mit Einheiten) enthält.

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Klicken Sie im Register Benutzerdefiniert auf Neues Format. Das Dialogfeld ASCII-Exportformat definieren erscheint.

3.	Geben Sie einen Namen im Feld Name ein.

4.	Klicken Sie im Feld Formatinhalt auf die rechte Maustaste, und wählen Sie aus dem Verknüpfungsmenü Felder / Name.

[Name] erscheint im Feld Formatinhalt.

5.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Großbuchstaben aus dem Verknüpfungsmenü.

[Name:Großbuchstaben] erscheint im Feld Formatinhalt. Das bedeutet, daß alle Punktnamen in Großbuchstaben exportiert werden.

6.	Geben Sie ein Komma mit anschließender Leertaste ein.

7.	Klicken Sie auf die rechten Maustaste, und wählen Sie Felder / Hochwert aus dem Verknüpfungsmenü.

[Hochwert] erscheint neben dem Komma.

8.	Klicken Sie auf die rechten Maustaste, und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Einheiten aus dem Verknüpfungsmenü.

[Hochwert] wird zu [Hochwert:Einheiten]. Das bedeutet, daß die aktuelle Koordinateneinheit in die Datei eingeschlossen wird.

9.	Geben Sie ein Komma mit anschließender Leertaste ein.

10.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Rechtswert aus dem Verknüpfungsmenü.

[Rechtswert] erscheint neben dem Komma.

11.	Klicken Sie auf die rechten Maustaste, und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Einheiten aus dem Verknüpfungsmenü.

[Rechtswert] wird zu [Rechtswert:Einheiten]. Das bedeutet, daß die aktuelle Koordinateneinheit in die Datei eingeschlossen wird.

12.	Geben Sie ein Komma mit anschließender Leertaste ein.

13.	Klicken Sie auf die rechte Maustaste, und wählen Sie Felder / Höhe aus dem Verknüpfungsmenü.

[Höhe] erscheint neben dem Komma.

14.	Klicken Sie auf die rechten Maustaste, und wählen Sie Felder / Fortgeschritten / Zusatzoptionen / Einheiten aus dem Verknüpfungsmenü.

[Höhe] wird zu [Höhe:Einheiten]. Das bedeutet, daß die aktuelle Koordinateneinheit in die Datei eingeschlossen wird.

15.	Klicken Sie auf OK, um das Exportformat zu speichern.

Das Dialogfeld Exportieren erscheint. Das von Ihnen erzeugte Format erscheint in der Liste im Register Benutzerdefiniert.

16.	Um Daten in diesem Format zu exportieren, wählen Sie das Format, und klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

17. 	Geben Sie einen Namen für die Exportdatei im Feld Dateiname ein.

18.	Klicken Sie auf Speichern, um die Datei zu erzeugen.


Die graphische Auswahl verwenden

 Überblick und weitere Informationen

Verwenden Sie die graphische Auswahl, um die Werte für Felder von bestehenden Elementen in der Datenbank einzugeben. Wenn die graphische Auswahl verfügbar ist, erscheint der Zeiger der graphischen Auswahl im Graphikfenster. In diesem Beispiel wird die graphische Auswahl verwendet, um die Koordinaten beim Hinzufügen eines Textelements auszuwählen.

1.	Wählen Sie Einfügen / Text. Das Dialogfeld Text einfügen erscheint.

2.	Geben Sie den Text im Feld Textausdruck ein.

3.	Wählen Sie das Feld Hochwert.

4.	Positionieren Sie den Zeiger über dem Graphikfenster. Der Zeiger der graphischen Auswahl wird eingeblendet.

5.	Klicken Sie auf die Stelle im Graphikfenster, an der der Text erscheinen soll. Die Koordinaten werden in die Felder Hochwert und Rechtswert eingetragen.

6.	Klicken Sie auf OK, um den Text zur Datenbank hinzuzufügen.

TIP: Sie können die graphische Auswahl verwenden, um die Zeiten einer Beobachtung (durch Klicken auf die Beobachtung) einzugeben.


Die Blatt-Konfiguration graphisch einrichten (plotten/drucken)

 Überblick und weitere Informationen

1.	Wählen Sie Datei / Blatt konfigurieren. Das Dialogfeld Blatt konfigurieren erscheint.

2.	Klicken Sie auf Beste Anpass.

3.	Klicken Sie auf das Feld Ursprung Ho oder Ursprung Re. Der Zeiger der graphischen Auswahl erscheint.

4.	Klicken Sie im Graphikfenster auf die Stelle, die die obere linke Ecke des Plot-Bereichs bilden soll.

5.	Stellen Sie die Rotation so ein, daß sie den Projektdaten im gewählten Planrahmen am besten angepaßt ist.

6.	Klicken und ziehen Sie die Plot-Box im Graphikfenster über die Projektdaten.

7.	Ändern Sie den Maßstab zu einem Standardwert. Wenn z. B. die beste Anpassung des Plots bei 1:435 liegt, ändern Sie ihn zu 1:500.

8.	Klicken Sie auf OK, um die Einstellungen der Blatt-Konfiguration anzuwenden.


Ein Geoidmodell für ein Projekt auswählen

 Überblick und weitere Informationen

Verwenden Sie den Koordinatensystem-Assistenten, um ein Geoidmodell für ein Projekt zu wählen. Dies gilt auch, wenn Sie das Geoidmodell für das aktuelle Koordinatensystem ändern möchten.

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Koordinatensystem.

3.	Klicken Sie in der Gruppe Koordinatensystem-Einstellungen auf Ändern. Das Dialogfeld Koordinatensystem wählen erscheint.

4.	Wählen Sie die Option Neues System, und klicken Sie auf Weiter. Das Dialogfeld Koordinatensystemtyp wählen erscheint.

5.	Wählen Sie den entsprechenden Koordinatensystemtyp. Das Dialogfeld Geoid-Modell wählen erscheint am Ende des Koordinatensystem-Assistenten. Wählen Sie das gewünschte Geoidmodell. Die Liste der verfügbaren Geoidmodelle wird von der Koordinatensystem-Datenbank eingelesen. Das Standard-Geoidmodell für das Koordinatensystem wird gemäß Voreinstellung ausgewählt.

6.	Klicken Sie auf Fertig stellen.

Das von Ihnen gewählte Geoidmodell wird auf das Projekt angewendet.

HINWEIS: Sie können das Standard-Geoidmodell für ein Koordinatensystem auch mit Hilfe des Coordinate System Manager-Programms auswählen.


Punkte mit Attributen ausschneiden oder zwischen Projekten kopieren

 Überblick und weitere Informationen

1.	Wählen Sie aus dem Quellprojekt die Punkte, die Sie in das Zielprojekt kopieren möchten. Verwenden Sie den Befehl Wählen / Nach Punktmerkmal (verfügbar in der Planansicht), um Punkte mit dem von Ihnen angegebenen Merkmal zu wählen.

2.	Wählen Sie Bearbeiten / Kopieren, um die Punkte zu kopieren, die Sie in dem neuen Projekt benötigen.

3.	Wählen Sie im Zielprojekt Bearbeiten / Einfügen, um die Punkte einzufügen.

4.	Wenn die Attributdefinitionen in zwei Projekten unterschiedlich sind, erscheint ein Dialogfeld.

5.	Klicken Sie auf Ja, um die Daten einzufügen, die in beiden Merkmals- und Attributbibliotheken enthalten sind. Alle Attributdaten, die nicht eingefügt wurden, werden im Bericht Paste.rpt aufgezeichnet. Dieser Bericht wird im Berichtordner des Projekts, in das Sie einfügen, gespeichert.

HINWEIS: Es können nur Punkte ausgeschnitten und zwischen Projekten kopiert werden. Wenn Beobachtungen zur Punktpositionierung verwendet wurden, dann werden die abgeleiteten Koordinaten kopiert. Wenn die Punkte aus GPS-Koordinaten und Beobachtungen abgeleitet wurden, dann wird die WGS-84 Koordinate kopiert. Die kopierte WGS-84 Koordinate kann in GPS-Kalibrierungen im neuen Projekt verwendet werden.


Attribute zu einem Punkt hinzufügen

 Überblick und weitere Informationen

Um Attribute hinzuzufügen, müssen Sie das Projekt für Attribute einrichten.

1.	Wählen Sie den Punkt, zu dem Sie Attribute hinzufügen möchten. Verwenden Sie hierzu eine der folgenden Möglichkeiten:

  die Maus

  das Menü Wählen

2.	Öffnen Sie das Eigenschaftsfenster.

3.	Klicken Sie im Register Attribute auf das Symbol Menü Seite [image]. Das Verknüpfungsmenü erscheint.

4.	Klicken Sie auf Einfügen. Die Liste der verfügbaren Kartiercodes mit Attributen erscheint.

5.	Wählen Sie den Kartiercode mit Attributen, den Sie hinzufügen möchten. Die Attribute für den ausgewählten Kartiercode erscheinen.

6.	Geben Sie Werte für jedes Attribut ein. Trimble Geomatics Office überprüft jeden Wert, den Sie eingeben. Diese Überprüfung stellt sicher, daß der Wert für die Merkmals- und Attributbibliothek, die Sie zum Einrichten des Projekts für Attribute verwendet haben, gültig ist.

7.	Wiederholen Sie die vorstehend genannten Schritte für alle weiteren Kartiercodes mit Attributen, die Sie zum Punkt hinzufügen möchten.


Attribute ansehen

 Überblick und weitere Informationen

1.	Wählen Sie den(die) Punkt(e) aus. Führen Sie dazu einen der folgenden Schritte aus:

  Verwenden Sie die Maus.

  Verwenden Sie das Menü Wählen.

2.	Öffnen Sie das Eigenschaftsfenster.

3.	Wählen Sie das Register Attribute.

Sie können nur jeweils einen Kartiercode mit Attributen ansehen. Verwenden Sie die Dropdown-Liste, um einen anderen Kartiercode mit Attributen anzusehen.

HINWEIS: Das Register Attribute wird nur eingeblendet, wenn Sie eine Merkmals- und Attributbibliothek für das Projekt über das Dialogfeld Projekteigenschaften / Register Merkmale eingerichtet haben.


Attribute bearbeiten

 Überblick und weitere Informationen

1.	Klicken Sie auf das Attribut. Wenn das Attribut ein Menü ist, erscheint ein Pfeil auf der rechten Seite des Felds.

2.	Klicken Sie auf den Pfeil, um die Liste der Menüoptionen für das Attribut darzustellen.

Alle anderen Attributtypen müssen über die Tastatur eingegeben werden.

HINWEIS: Wenn Sie Attributinformationen bearbeiten, überprüft Trimble Geomatics Office die Definition der Merkmals- und Attributbibliothek, um sicherzustellen, daß gültige Werte eingegeben worden sind.


Eine Linie einfügen

 Überblick und weitere Informationen

1.	Wählen Sie die Planansicht. Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Ansicht / Plan.

  Klicken Sie auf das Symbol Planansicht.

  Drücken Sie Alt+2.

2.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Einfügen / Linien.

  Wählen Sie das Symbol Linie einfügen.

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Linie ist gewählt.

3.	Führen Sie einen der folgenden Schritte im Feld Von Punkt aus:

  Verwenden Sie die graphische Auswahl, um den ersten Punkt, den Sie zur Definition der Linie benötigen, auszuwählen.

  Geben Sie den Punktnamen für den ersten Punkt ein, den Sie zur Definition der Linie benötigen.

4.	Führen Sie einen der folgenden Schritte im Feld Zu Punkt aus:

  Verwenden Sie die graphische Auswahl, um den zweiten Punkt, den Sie zur Definition der Linie benötigen, auszuwählen.

  Geben Sie den Punktnamen für den zweiten Punkt ein, den Sie zur Definition der Linie benötigen.

5.	Führen Sie einen der folgenden Schritte im Feld Layer aus:

  Wählen Sie den Layer, zu dem Sie die Linie hinzufügen möchten.

  Geben Sie einen neuen Layer-Namen ein, um einen neuen Layer zu erzeugen.

6.	Wählen Sie im Feld Linienstil den Linienstil, den Sie zur Darstellung der Linie benötigen.

7.	Führen Sie einen der folgenden Schritte aus, um die Linie hinzuzufügen:

  Klicken Sie auf Einfügen.

  Drücken Sie die Eingabetaste.

Der von Ihnen im Feld Zu Punkt ausgewählte Punkt erscheint im Feld Von Punkt. Sie können mit dem Hinzufügen von Linien fortfahren, ohne den “Von”-Punkt erneut eingeben zu müssen.

Die Linie erscheint im Graphikfenster (vorausgesetzt, daß die Sichtbarkeit des Layers, den Sie für die Linie gewählt haben, eingeschaltet ist).

8.	Klicken Sie auf Schließen, um das Einfügen von Linien zu beenden.


Eine Kurve einfügen

 Überblick und weitere Informationen

1.	Wählen Sie die Planansicht. Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Ansicht / Plan.

  Klicken Sie auf das Symbol Planansicht.

  Drücken Sie Alt+2.

2.	Wählen Sie Einfügen / Kurven. Das Dialogfeld Liniennetz einfügen erscheint. Das Register Kurve ist gewählt.

3.	Führen Sie einen der folgenden Schritte im Feld Von Punkt aus:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf den gewünschten Punkt.

  Verwenden Sie die Tastatur, um den Punktnamen einzugeben.

4.	Führen Sie einen der folgenden Schritte im Feld Zu Punkt aus:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf den gewünschten Punkt.

  Verwenden Sie die Tastatur, um den Punktnamen einzugeben.

5.	Behalten Sie für die Werte in den Feldern Eingangstangente und Ausgangstangente die Einstellung <Automatisch> bei, um die Tangentenwerte, die auf den zur Definition der Kurve verwendeten Punkten basieren, automatisch einzugeben. Sie können Ihre eigenen Tangentenwerte eingeben.

6.	Geben Sie im Feld Rundung einen Wert zwischen 0 und 1 ein. Die Rundung bestimmt die Krümmung der Kurve. Je höher die Rundung ist, desto größer die Krümmung der Kurve.

7.	Führen Sie einen der folgenden Schritte im Feld Layer aus:

  Wählen Sie den Layer, zu dem Sie die Kurve hinzufügen möchten.

  Geben Sie einen neuen Layer-Namen ein, um einen neuen Layer zu erzeugen.

8.	Wählen Sie im Feld Linienstil den Linienstil, den Sie zur Darstellung der Kurve benötigen.

9.	Führen Sie einen der folgenden Schritte aus, um die Kurve hinzuzufügen:

  Klicken Sie auf Einfügen.

  Drücken Sie die Eingabetaste.

Die Kurve erscheint im Graphikfenster (vorausgesetzt, daß die Sichtbarkeit des Layers, den Sie für die Kurve gewählt haben, eingeschaltet ist). Jedes Mal, wenn Sie eine Kurve von einem Punkt hinzufügen, der in einer anderen Kurve verwendet wird, berechnet Trimble Geomatics Office die bestehende Kurve erneut, um eine glatte Kurvendarstellung sicherzustellen.

10.	Klicken Sie auf Schließen, um das Einfügen von Kurven zu beenden.


Einen Bogen einfügen

 Überblick und weitere Informationen

1.	Wählen Sie die Planansicht. Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Ansicht / Plan.

  Klicken Sie auf das Symbol Planansicht.

  Drücken Sie Alt+2.

2.	Wählen Sie Einfügen / Bogen. Das Dialogfeld Liniennetz einfügen erscheint. Das Register Bogen ist gewählt.

3.	Führen Sie einen der folgenden Schritte im Feld Von Punkt aus:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf den gewünschten Punkt.

  Verwenden Sie die Tastatur, um den Punktnamen einzugeben.

4.	Führen Sie einen der folgenden Schritte im Feld Zu Punkt aus:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf den gewünschten Punkt.

  Verwenden Sie die Tastatur, um den Punktnamen einzugeben.

5.	Führen Sie einen der folgenden Schritte im Feld Mittelpunkt aus, um einen bestehenden Punkt als Mittelpunkt des Bogens zu verwenden.

  Geben Sie einen bestehenden Punktnamen ein.

  Verwenden Sie die graphische Auswahl, um einen bestehenden Punkt auszuwählen.

Die Koordinaten für den Punkt werden in die Felder Hochwert und Rechtswert kopiert.

6.	Klicken Sie in den Feldern Hochwert und Rechtswert auf eine Stelle im Graphikfenster, um die Koordinaten als Mittelpunkt des Bogens zu verwenden. Die Koordinaten werden in diese Felder kopiert.

Wenn Sie sowohl einen Mittelpunkt als auch Mittelpunkt-Koordinaten eingeben, wird der Mittelpunkt verwendet.

7.	Wählen Sie im Feld Kleiner Bogen die Option Falsch, wenn Sie einen großen Bogen erzeugen möchten. Wählen Sie andernfalls Wahr. Es sind grundsätzlich zwei Bögen zwischen zwei Punkten möglich, die zusammen einen Kreis bilden. Diese Einstellung bestimmt den Bogen, den Sie zeichnen möchten.

8.	Führen Sie einen der folgenden Schritte im Feld Layer aus:

  Wählen Sie den Layer, zu dem Sie den Bogen hinzufügen möchten.

  Geben Sie einen neuen Layer-Namen ein, um einen neuen Layer zu erzeugen.

9.	Wählen Sie im Feld Linienstil den Linienstil, den Sie zur Darstellung des Bogens benötigen.

10.	Führen Sie einen der folgenden Schritte aus, um den Bogen hinzuzufügen:

  Klicken Sie auf Einfügen.

  Drücken Sie die Eingabetaste.

Der Bogen erscheint im Graphikfenster (vorausgesetzt, daß die Sichtbarkeit des Layers, den Sie für die Kurve gewählt haben, eingeschaltet ist).

11.	Klicken Sie auf Schließen, um das Einfügen von Bögen zu beenden.


Text einfügen

 Überblick und weitere Informationen

1.	Wählen Sie die Planansicht. Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Ansicht / Plan.

  Klicken Sie auf das Symbol Planansicht.

  Drücken Sie Alt+2.

2.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Einfügen / Text.

  Klicken Sie auf das Hilfsmittel Text einfügen.

Das Dialogfeld Text einfügen erscheint.

3.	Geben Sie im Feld Textausdruck den Text ein, der eingeblendet werden soll. Um Feldcodes (z. B. den Projektnamen) zu verwenden, klicken Sie zur Ansicht des Verknüpfungsmenüs auf die rechte Maustaste, und wählen Sie Felder.

4.	Geben Sie im Feld Hochwert den Hochwert für die Position des Textes ein. Verwenden Sie alternativ die graphische Auswahl, indem Sie auf eine Stelle im Graphikfenster klicken.

5.	Geben Sie im Feld Rechtswert den Rechtswert für die Position des Textes ein. Verwenden Sie alternativ die graphische Auswahl, indem Sie auf eine Stelle im Graphikfenster klicken.

6.	Geben Sie die Orientierung des Textelements im Feld Orientierung ein. Wenn Sie keine Orientierung angeben, wird der Text horizontal im Fenster dargestellt.

7.	Geben Sie im Feld Verankerungstyp an, wo der Text im Bezug auf die Hoch- und Rechtswerte positioniert werden soll, und wählen Sie einen Wert aus der Liste.

8.	Wählen Sie den Layer, zu dem Sie den Text hinzufügen möchten, aus der Liste im Feld Layer. Geben Sie einen neuen Namen ein, um Text in einen neuen Layer einzugeben.

9.	Wählen Sie den Textstil für das Textelement aus der Liste im Feld Textstil. Wenn Sie den voreingestellten Textstil für Layer benötigen, zu denen Sie Text hinzufügen möchten, wählen Sie die Option <Nach Layer>.

10.	Klicken Sie auf Einfügen, um den Text zur Datenbank hinzuzufügen, und lassen Sie das Dialogfeld geöffnet, um einen weiteren Text hinzuzufügen.

11.	Klicken Sie auf Schließen, um das Einfügen von Text zu beenden.


Eine neue Projektvorlage erstellen

 Überblick und weitere Informationen

1.	Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf das Symbol Neu.

  Wählen Sie Datei / Neues Projekt.

Das Dialogfeld Neues Projekt erscheint.

2.	Wählen Sie die Option Vorlage in der Gruppe Neu. Der Projektordner in der Gruppe Details wird zum Standardordner für Vorlagen.

3.	Geben Sie im Feld Name einen Namen für die Projektvorlage ein.

4.	Wählen Sie eine Vorlage aus der Liste im Feld Vorlage, und klicken Sie auf OK. Das Dialogfeld Projekteigenschaften erscheint.

5.	Wählen Sie die Projekteigenschaften, die für alle Projekte, die diese Vorlage verwenden, als Voreinstellungen gelten sollen, und klicken Sie auf OK.

Eine Meldung erscheint. Klicken Sie auf Ja, um mit der Bearbeitung der Vorlage fortzufahren. Klicken Sie auf Nein, um die Projektvorlage zu schließen.

6.	Wenn Sie Ja wählen, können Sie die Projektvorlage weiter bearbeiten. Um die Arbeit an der Projektvorlage zu beenden, wählen Sie Datei / Schließen.

7.	Wenn Sie ein neues Projekt erstellen, wird die neue Vorlage in der Liste Vorlage im Dialogfeld Neues Projekt angezeigt.


Einen Punktstil erzeugen

 Überblick und weitere Informationen

1.	Wählen Sie Bearbeiten / Stile in der Planansicht. Das Dialogfeld CAD-Stile erscheint.

2.	Klicken Sie im Register Punktstile auf Neu. Das Dialogfeld Punktstil erzeugen erscheint.

3.	Vervollständigen Sie das Dialogfeld Punktstil erzeugen.

4.	Klicken Sie auf OK.

Der Punktstil wird zur Datenbank hinzugefügt. Er erscheint im Dialogfeld CAD-Stile – Register Punktstile.


Das Eigenschaftsfenster öffnen

 Überblick und weitere Informationen

Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Bearbeiten / Eigenschaften.

  Klicken Sie auf das Symbol Eigenschaften bearbeiten [image].

  Wählen Sie Eigenschaften aus dem Verknüpfungsmenü.

  Doppelklicken Sie auf ein graphisches Element.

  Drücken Sie Alt + Eingabe.


Eine Attribut-Verzeichnisdatei (.ddf) zu Trimble Survey Controller exportieren

 Überblick und weitere Informationen

HINWEIS: Sie können .ddf-Dateien nur zu einem Gerät übertragen, auf dem die Trimble Survey Controller-Version 7.00 oder höher ausgeführt wird.

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Attribut-Verzeichnis zu Survey Controller (*.ddf), und klicken Sie auf OK. Das Dialogfeld Wählen erscheint.

3.	Wählen Sie die Datei, die Sie zu Trimble Survey Controller übertragen möchten, und klicken Sie auf Öffnen. Das Dialogfeld Speichern unter erscheint.

4.	Wählen Sie ein Survey Controller-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint.

Wenn die Verbindung zum Gerät hergestellt ist, erscheint Hauptspeicher (C:) im Feld.

Wenn gerade eine PC-Karte im Gerät eingelegt ist, wird zudem PC-Karte (A:) eingeblendet.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

5.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), um die Datei im Hauptspeicher des Trimble Survey Controllers zu speichern.

  Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Datei auf der PC-Karte speichern möchten.

6.	Klicken Sie auf Öffnen. Der Hauptspeicher oder die PC-Karte wird gelesen. Die bestehenden Attribut-Verzeichnisdateien werden eingeblendet.

7.	Im Feld Dateiname erscheint der interne Name der .ddf-Datei, die Sie für den Export ausgewählt haben. Dies ist der Name, der in Trimble Survey Controller angezeigt wird.

8.	Bearbeiten Sie diesen Namen, falls erforderlich.

9.	Klicken Sie auf Speichern. Das Dialogfeld Sende erscheint. Die Statusleiste zeigt den Status der Übertragung an.

Nach dem Abschluß der Übertragung wird das Dialogfeld Sende ausgeblendet, und Sie kehren zum Graphikfenster zurück. Sie können die .ddf-Datei jetzt mit Trimble Survey Controller verwenden.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller-Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


Eine .dc-Datei ziehen und in einem Projekt ablegen
Eine Datei ziehen und in einem Projekt ablegen

 Überblick und weitere Informationen

So können Sie Dateien ziehen und in einem Projekt ablegen:

1.	Öffnen Sie das Trimble Geomatics Office-Projekt, in das Sie die Dateien übertragen möchten.

2.	Öffnen Sie den Microsoft Windows Explorer.

Weitere Informationen finden Sie in der Dokumentation Ihres Microsoft Windows-Betriebssystems.

3.	Finden Sie den Ordner, der die Dateien enthält, die Sie importieren möchten.

4.	Klicken Sie mit der rechten Maustaste auf die gewünschten Dateien.

5.	Ziehen Sie die Dateien in das Trimble Geomatics Office-Graphikfenster.

6.	Lassen Sie die rechte Maustaste los, um das Verknüpfungsmenü anzusehen.

7.	Wählen Sie die geeignete Option für die Dateien.

8.	Klicken Sie auf die linke Maustaste. Die  Dateien werden importiert.

Weitere Informationen über die Vorgänge beim Importieren finden Sie unter dem Thema Importieren − Überblick. Die Dateien werden im Ordner Data Files \Trimble Files des Projekts gespeichert.


Punkte nach Namen auswählen

1.	Wählen Sie Wählen / Punkte. Das Dialogfeld Punkte wählen erscheint.

2.	Wählen Sie das Register Allgemein.

3.	Geben Sie im Feld Namen den Namen des Punkts ein, den Sie auswählen möchten. Sie können zudem Bereiche und Platzhalterzeichen verwenden, um mehrere Punkte auszuwählen.

4.	Klicken Sie auf OK. Der(die) Punkt(e), der(die) mit dem von Ihnen gewählten Namen übereinstimmt(en), werden ausgewählt. Die Statusleiste zeigt an, wie viele Punkte ausgewählt wurden.

HINWEIS: Alle Elemente, die vor der Verwendung des Dialogfelds Punkte wählen ausgewählt wurden, werden nur in der Auswahlmenge beibehalten, wenn Sie das Kontrollkästchen Zu aktueller Auswahl hinzufügen aktivieren.


Punkte nach Punktqualität auswählen

1.	Wählen Sie Wählen / Punkte. Das Dialogfeld Punkte wählen erscheint.

2.	Wählen Sie das Register Allgemein.

3.	Wählen Sie im Feld Mit Punktqualität(en) die gewünschte Komponente und Qualitätskombination. Sie können mehrere Elemente aus der Liste wählen.

4.	Klicken Sie auf OK.

Der(die) Punkt(e), die mit Ihrer Auswahl übereinstimmt(en), werden ausgewählt. Die Statusleiste zeigt an, wie viele Punkte ausgewählt wurden.

HINWEIS: Alle Elemente, die vor der Verwendung des Dialogfelds Punkte wählen ausgewählt wurden, werden nur in der Auswahlmenge beibehalten, wenn Sie das Kontrollkästchen Zu aktueller Auswahl hinzufügen aktivieren.


Beobachtungen von einem ausgewählten Punkt wählen

1.	Wählen Sie in der Vermessungsansicht Wählen / Beobachtungen. Das Dialogfeld Beobachtungen wählen erscheint.

2.	Geben Sie den Punktnamen im Feld Von Punkt ein, oder geben Sie einen Bereich ein, um mehrere Punkte in der Auswahl zu verwenden. Sie können auch die graphische Auswahl sowie Platzhalter verwenden.

3.	Klicken Sie auf OK.

Die Punktbeobachtungen, die mit Ihrer Auswahl übereinstimmen, werden ausgewählt. Die Statusleiste zeigt an, wie viele Beobachtungen ausgewählt wurden.

HINWEIS: Alle Elemente, die vor der Verwendung des Dialogfelds Punkte wählen ausgewählt wurden, werden nur in der Auswahlmenge beibehalten, wenn Sie das Kontrollkästchen Zu aktueller Auswahl hinzufügen aktivieren.


Beobachtungen deaktivieren

1.	Wählen Sie eine Beobachtung in der Vermessungsansicht.

2.	Führen Sie einen der folgenden Schritte aus:

  Öffnen Sie das Eigenschaftsfenster. Klicken Sie auf das Symbol Zusammenfassung [image], und wählen Sie die Option Deaktiviert im Feld Status.

  Wählen Sie Bearbeiten / Beobachtung aktivieren/deaktivieren.

HINWEIS: Das Deaktivieren von Beobachtungen erfordert eine Neuberechnung, um die Vermessungsinformationen zu aktualisieren. Wenn Sie einen Punkt verschieben, werden alle Beobachtungen zu diesem Punkt automatisch deaktiviert.


Projekte aus Trimble Survey Controller in Trimble Geomatics importieren
Projekte aus Trimble Survey Controller in Trimble Geomatics Office importieren

1.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Datei / Importieren.

  Klicken Sie auf das Symbol Importieren.

2.	Wählen Sie im Register Vermessung die Option Vermessungsgeräte. Das Dialogfeld Data Transfer Öffnen erscheint.

3.	Wählen Sie ein Trimble Survey Controller-Gerät.

4.	Klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint. Nachdem eine Verbindung hergestellt ist, wird das Dialogfeld Öffnen aktualisiert, um das ausgewählte Gerät anzuzeigen.

5.	Wählen Sie die Dateien, die Sie übertragen möchten, mit Hilfe einer der folgenden Optionen:

  Option Hauptspeicher (C:) für die Datei(en), die im Hauptspeicher des Trimble Survey Controllers gespeichert sind.

  Option PC-Karte (A:) für die Datei(en), die auf einer PC-Karte gespeichert sind, die im Survey Controller eingelegt ist.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

6.	Klicken Sie auf Öffnen. Das Dialogfeld Empfange erscheint. Die Statusleiste zeigt den Status der Übertragung an. Nach dem Abschluß der Übertragung wird das Dialogfeld Empfange ausgeblendet und die Verbindung zum Gerät unterbrochen.


Eine Symbolleiste ausblenden (oder einblenden)

1.	Führen Sie einen der folgenden Schritte aus:

  Klicken Sie im Bereich der Symbolleiste auf die rechte Maustaste. Ein Verknüpfungsmenü erscheint.

  Wählen Sie Ansicht / Symbolleisten. Ein Menü erscheint.

Die Liste der verfügbaren Symbolleisten wird eingeblendet. Alle Symbolleisten sind eingeblendet und eine Markierung erscheint neben jedem Namen.

2.	Wählen Sie die gewünschte Symbolleiste. Die Symbolleiste wird im Trimble Geomatics Office Graphikfenster eingeblendet (oder ausgeblendet).

3.	Wiederholen Sie die vorstehend genannten Schritte, um die Symbolleiste wieder einzublenden.


Antennendetails zu Trimble Survey Controller übertragen

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

5.	Wählen Sie im Register Vermessung die Option Antennendetails zu Survey Controller.

Das Dialogfeld Data Transfer Speichern unter erscheint.

3.	Wählen Sie ein Trimble Survey Controller-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint.

Wenn eine Verbindung hergestellt ist, erscheint das Dialogfeld Speichern unter.

4.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie die Option Hauptspeicher (C:), um die Datei im Hauptspeicher des Trimble Survey Controllers zu speichern.

  Wählen Sie die Option PC-Karte (A:), wenn Sie eine PC-Karte eingelegt haben und die Datei auf der PC-Karte speichern möchten.

HINWEIS: Dieses Dialogfeld erscheint nur, wenn das Gerät über eine PC-Karte verfügt.

5.	Klicken Sie auf Öffnen. Das von Ihnen gewählte Verzeichnis wird eingelesen. Es werden alle Survey Controller-Dateien im Verzeichnis dargestellt. Der Name des Trimble Geomatics Office-Projekts erscheint im Feld Dateiname. Dies ist der Name des Trimble Survey Controller-Projekts, das zu Trimble Survey Controller exportiert wird. Sie können diesen Namen, falls erforderlich, bearbeiten.

6.	Klicken Sie auf Speichern. Das Dialogfeld Sende erscheint. Die Statusleiste zeigt den Status der Übertragung an.

Die Datei Antenna.ini (im Ordner \Programme\Gemeinsame Dateien\Trimble\Config) wird zu Trimble Survey Controller übertragen.

Nach dem Abschluß der Übertragung wird das Dialogfeld Sende ausgeblendet, und die Verbindung zum Gerät wird unterbrochen.


Attributnotizen exportieren

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register CAD / ASCII die Option DC-Datei-Attributnotizen (Survey Controller V4), und klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

3.	Geben Sie den Namen der Datei ein.

4.	Klicken Sie auf Speichern.


Informationen über Trimble Geomatics Office anzeigen

1.	Wählen Sie im Menü Hilfe den Befehl Info über Trimble Geomatics Office. Das Dialogfeld Info über Trimble Geomatics Office erscheint.

2.	Klicken Sie auf OK.


Die Richtung einer Beobachtung umkehren

1.	Wählen Sie in der Vermessungsansicht die Beobachtung, deren Beobachtungsfluß umgekehrt werden soll.

2.	Wählen Sie Bearbeiten / Beobachtungsfluß umkehren.

3.	Der Beobachtungsfluß der Beobachtung wird umgekehrt. Wenn die Beobachtung in umgekehrter Richtung angewendet wird, können sich die berechneten Koordinaten und Qualitäten des Punkts ändern.

ACHTUNG: Wenn der Punkt, von dem der Beobachtungsfluß ausgehen soll, keine bekannte Position besitzt (wie z. B. ein RTK- Punkt), wird die Beobachtung nicht angewendet.

HINWEIS: Der Beobachtungsfluß terrestrischer Beobachtungen, die unter Verwendung einer Totalstation erfaßt wurden, kann nicht umgekehrt werden.


Fehler und Warnungen ansehen

1.	Führen Sie einen der folgenden Schritte aus:

  Doppelklicken Sie in der Vermessungsansicht auf einen Punkt oder eine Beobachtung mit einer Warnkennzeichnung.

  Doppelklicken Sie auf das Flaggensymbol in der Statusleiste, um alle Punkte und Beobachtungen mit Warnkennzeichnungen auszuwählen.

Das Eigenschaftsfenster mit dem(den) ausgewählten Element(en) erscheint.

2.	Wählen Sie im Eigenschaftsfenster den Punkt oder die Beobachtung, die Sie ansehen möchten (falls Sie mehr als ein Element ausgewählt haben).

3.	So können Sie die Seite Warnung ansehen:

  Klicken Sie auf die Menü-Schaltfläche Warnung [image].

Die Meldung zeigt den Typ des aufgetretenen Fehlers an.

4.	Um zusätzliche Details für einen Punkt anzusehen, wählen Sie das Symbol Punktableitungsbericht anzeigen [image].

Der Punktableitungsbericht erscheint.


UK National Grid-Dateien (*.pgf) zu Trimble Survey Controller übertragen

HINWEIS: Sie können nur .pgf-Dateien nur zur Trimble Survey Controller-Version 7.50 (oder höher) übertragen.

1.	Starten Sie das Trimble Data Transfer-Programm. Führen Sie einen der folgenden Schritte aus:

  Wählen Sie Programme / Trimble Data Transfer, wenn kein Projekt geöffnet ist.

  Wählen Sie jederzeit Start / Programme / Trimble Office / Trimble Geomatics Office / Trimble Dienstprogramme / Data Transfer.

Das Dialogfeld Datenübertragung erscheint.

2.	Wählen Sie das Register Senden.

3.	Wählen Sie unter Verwendung der Schaltfläche Geräte das Survey Controller-Gerät, zu dem Sie Dateien exportieren möchten. Das Trimble Data Transfer-Program versucht, die Verbindung zu dem ausgewählten Gerät herzustellen. Wenn die Verbindung gelungen ist, verändert sich das Kabel in dem Symbol rechts oben, um anzuzeigen, daß das Gerät verbunden ist, und die Statuszeile unter dem Symbol rechts oben zeigt ‘Verbunden mit <Gerät>’ an, wobei <Gerät> den Typ des Geräts darstellt (z. B. einen Survey Controller).

4.	Klicken Sie auf Hinzufügen. Das Dialogfeld Öffnen erscheint. Die Liste Suchen in zeigt den letzten Ordner an, aus dem Sie Dateien für dieses Gerät gewählt haben. Die Hauptliste stellt die Ordner und Dateien in diesem Ordner dar.

5.	Wählen Sie aus der Liste Dateityp die Option UK National Grid-Dateien (*.PGF).

6.	Verwenden Sie die Liste Suchen in sowie das Listenfeld, um das gewählte Laufwerk und den Ordner zu ändern, und wählen Sie die Dateien, die Sie übertragen möchten.

Um die bestehenden .pgf-Dateien, die von Trimble Geomatics Office zur Verfügung gestellt werden, zu übertragen, wählen Sie die Hochwert.pgf- oder Rechtswert.pgf-Datei aus dem Ordner Programme\Gemeinsame Dateien\Trimble\Geodata.

7.	Sie können Dateien zum Hauptspeicher oder zu einer PC-Karte senden, falls diese installiert ist. Wählen Sie das Ziel aus der Liste Ziel.

8.	Stellen Sie sicher, daß das Feld Dateiformat auf Projekt-Datei V7.50 eingestellt ist. Wählen Sie diese Option, falls erforderlich, aus der Liste.

9.	Klicken Sie auf Wählen. Das Dialogfeld Öffnen wird geschlossen, und Sie kehren zum Dialogfeld Datenübertragung zurück. Die von Ihnen ausgewählten Dateien erscheinen in der Liste Dateien zu senden.

10.	Klicken Sie auf Übertragen. Das Dialogfeld Konvertiere erscheint, wenn die Dateien vom Dateiformat des Geräts konvertiert werden. Nachdem alle Dateien konvertiert wurden, erscheint das Dialogfeld Sende, in dem der Export-Status der ausgewählten Dateien angezeigt wird.

Nach dem Abschluß der Übertragung erscheint das Dialogfeld Übertragung beendet, in dem die Ergebnisse der Übertragung zu sehen sind.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller-Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


Mit Hilfe von gespeicherten Kalibrierungskoordinaten und ausgeglichenen Koordinaten (vom Netzausgleichungsmodul abgeleitet) kal
Mit Hilfe von gespeicherten Kalibrierungskoordinaten und ausgeglichenen Koordinaten (vom Netzausgleichungsmodul abgeleitet) kalibrieren

1.	Speichern Sie nach Abschluß einer minimal bedingten Ausgleichung und der Bestimmung der WGS-84-Koordinaten für die Punkte in der Netzausgleichung diese Koordinaten, um sie als beobachtete GPS-Koordinaten für eine GPS-Kalibrierung zu verwenden. Die Kalibrierungskoordinaten bestehen aus den WGS-84-Breitengraden, Längengraden und Ellipsoidhöhen.

So speichern Sie die Kalibrierungskoordinaten:

  Wählen Sie Ausgleichung / Kalibrierungskoordinaten / Speichern.

Das Dialogfeld Kalibrierungskoordinaten speichern erscheint.

HINWEIS: Dieser Befehl ist nur verfügbar, wenn WGS-84 als Ausgleichungsdatum gewählt ist und ausschließlich GPS-Beobachtungen in der vorherigen Ausgleichung verwendet wurden.

HINWEIS: Wenn Ausgleichungstransformationsparameter während einer Ausgleichung erstellt wurden, werden diese verworfen, wenn Sie eine GPS-Kalibrierung durchführen. In Trimble Geomatics Office ist nur eines von beiden zulässig.

2.	Wählen Sie eine der folgenden Optionen:

  die Option Bestende Punkte in der Gruppe Koordinaten für Kalibrierung speichern

  die Option Neue Punkte mit Suffix in der Gruppe Koordinaten für Kalibrierung speichern

3.	Klicken Sie auf OK. Die Kalibrierungskoordinaten werden gespeichert.

HINWEIS: Eine WGS-84 Koordinate wird für jeden Punkt in der Ausgleichung erstellt. Sie können diese Koordinate im Eigenschaftsfenster ansehen. Die Koordinate kann nicht bearbeitet werden.

4.	Führen Sie eine bedingte Ausgleichung durch (Informationen dazu finden Sie im entsprechenden Netzausgleichungshilfethema). Die ausgeglichenen Werte werden in der Datenbank gespeichert.

HINWEIS: Eine ausgeglichene Gitterkoordinate wird für jeden nicht bedingten Punkt in der Ausgleichung erstellt. Diese Koordinate kann im Eigenschaftsfenster angesehen werden.

5.	Führen Sie eine GPS-Kalibrierung mit den bei der Netzausgleichung abgeleiteten Punktpaaren durch. Wählen Sie hierzu Vermessung / GPS-Kalibrierung. Das Dialogfeld GPS-Kalibrierung erscheint.

6.	Wählen Sie in der Gruppe Kalibrierungskomponenten die Kalibrierungsparameter, die Sie berechnen möchten.

7.	Klicken Sie auf Punktliste. Das Dialogfeld Punktliste erscheint.

8.	Verwenden Sie das Dialogfeld Punktliste, um die Punktpaare (GPS-Punkt und Gitterpunkt) für die Kalibrierung auszuwählen. Führen Sie einen der folgenden Schritte aus:

  Verwenden Sie die graphische Auswahl, oder geben Sie den Namen der gespeicherten Kalibrierungskoordinate in das Feld GPS-Punkt ein.

  Verwenden Sie die graphische Auswahl, oder geben Sie den Namen der entsprechenden ausgeglichenen Koordinate in das Geld Gitterpunkt ein.

Wenn die minimal bedingte Koordinate unter dem gleichen Punkt gespeichert wurde, wird das Feld Gitterpunkt automatisch ausgefüllt. Wenn der GPS-Punkt eingegeben wird, stammen die angezeigten Werte von den gespeicherten Kalibrierungskoordinaten. Wenn der Gitterpunkt eingegeben ist, werden die ausgeglichenen Werte ausgewählt.

9.	Wiederholen Sie den vorstehenden Schritt, um alle Punktpaare auszuwählen, die Sie in der Kalibrierung benötigen.

10.	Wenn Sie alle Punktpaare ausgewählt haben, klicken Sie auf OK, um zum Dialogfeld GPS-Kalibrierung zurückzukehren.

11.	Klicken Sie auf Berechnen, um die Kalibrierungsparameter zu berechnen. Die Ergebnisse der Kalibrierung erscheinen in der Gruppe Berechnungszusammenfassung.

12.	Klicken Sie auf OK, um die Kalibrierung auf das Projekt anzuwenden. Das Koordinatensystem wird mit den Kalibrierungsparametern aktualisiert. Sie können die Kalibrierung jetzt zu Trimble Survey Controller übertragen.


Ereignisse exportieren und darüber berichten

Sie können ein Berichts- oder Exportformat definieren, um über den Zeitpunkt, an dem ein Ereignis im Empfänger erfaßt wurde, zu berichten.

Erstellen Sie einen benutzerdefinierten Datenbank-Bericht, um über Ereignisse zu berichten:

1.	 Wählen Sie Punkte mit Ereignisdatensätzen in Trimble Geomatics Office aus. So wählen Sie die Punkte aus:

a	Wählen Sie Wählen / Punkte. Das Dialogfeld Punkte wählen erscheint

b	Wählen Sie das Register GPS.

C	Wählen Sie die Option Ereignisse aus der Liste Feldmethode(n).

d	Klicken Sie auf OK

Alle Punkte mit Ereignisdatensätzen werden ausgewählt.

2.	Wählen Sie Berichte / Zusätzliche Berichte. Das Dialogfeld Zusätzliche Berichte erscheint.

3.	Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf Bearbeiten, um ein bestehendes Berichtsformat zu ändern.

  Klicken Sie auf Neues Format, um ein neues Berichtsformat zu erstellen.

Das Dialogfeld Berichtsformat definieren erscheint.

4.	Klicken Sie im Feld Formatinhalt auf die rechte Maustaste, um auf das Verknüpfungsmenü zuzugreifen, und wählen Sie Felder / Fortgeschritten / Unterdatensätze / Punktbeob / Zeit.

So exportieren Sie Ereignisse für benutzerdefinierte Exportdefinitionen:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Führen Sie im Register Benutzerdefiniert einen der folgenden Schritte aus:

  Klicken Sie auf Format bearbeiten, um ein bestehendes Format zu ändern.

  Klicken Sie auf Neues Format, um ein neues Berichtsformat zu erstellen.

Das Dialogfeld ASCII-Exportformat definieren erscheint.

3.	Klicken Sie im Feld Formatinhalt auf die rechte Maustaste, um auf das Verknüpfungsmenü zuzugreifen, und wählen Sie Felder / Fortgeschritten / Unterdatensätze / Punktbeob / Zeit.


Zeitformat-Layouts

Die Zeitanzeige für das Ereignisformat ist z. B. 09:12:55 8 Feb 2000

Wenn Sie dieses Layout ändern möchten, klicken Sie auf die rechte Maustaste neben dem Feldcode, um auf das Verknüpfungsmenü zuzugreifen, und wählen Sie dann Felder / Fortgeschritten / Mehr / Format-Layouts. Wählen Sie ein Beispiels-Zeitformat-Layout, oder erstellen Sie Ihr eigenes Layout. Weitere Informationen finden Sie unter Zeitformat-Layouts.

HINWEIS: Wenn Sie Ereigniszeiten auf die Millisekunde genau anzeigen möchten, fügen Sie das folgende Zeitformat-Layout zum Feldcode hinzu <H:mm:ss.nnn>. nnn steht für die Anzahl der Dezimalsekunden, z. B. [Punktbeob.Zeit:<H:mm:ss.nnn>]. Wenn Sie die Genauigkeit der Zeitanzeige erhöhen möchten, erhöhen Sie die Anzahl der Dezimalstellen. Wenn Sie nnnn eingeben, werden die ersten 4 Stellen der Dezimalsekunden angezeigt.


Beobachtungsdaten zwischen Projekten kopieren

Verwenden Sie das Trimble Datenaustauschformat, um Beobachtungsdaten zwischen Projekten in Trimble Geomatics Office zu kopieren. Die Funktionen Ausschneiden und Einfügen können hierfür nicht verwendet werden.

So kopieren Sie Beobachtungsdaten zwischen Projekten:

1.	Wählen Sie die zu kopierenden Beobachtungsdaten im aktuellen Trimble Geomatics Office-Projekt.

2.	Exportieren Sie die Daten für das aktuelle Projekt mit Hilfe des Trimble Datenaustauschformats:

a.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

b.	Wählen Sie im Register Vermessung die Option Trimble Datenaustauschformat, und klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

c.	Speichern Sie die Datei.

3.	Erstellen Sie ein neues Projekt in Trimble Geomatics Office.

4.	Importieren Sie die Beobachtungsdaten mit Hilfe des Trimble Datenaustauschformats in das neue Projekt:

a.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

b.	Wählen Sie im Register Vermessung die Option Trimble Datenaustauschformat, und klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

c.	Wählen Sie die Datei.

Die Beobachtungsdaten werden in das Trimble Geomatics Office Projekt importiert.

HINWEIS: Wenn Sie eine Kopie aller Beobachtungen und Punkte im Projekt erstellen möchten, kopieren Sie das Trimble Geomatics Office-Projekt.


Terrestrische Daten manuell importieren

Verwenden Sie das Softdesk-Feldbuchformat, um terrestrische Daten manuell in Trimble Geomatics Office zu kopieren. Dieses Format wurde von Autodesk entwickelt.

Erstellen Sie eine Datei im Softdesk-Feldbuchformat. Verwenden Sie dazu die terrestrischen Daten.

  Importieren Sie die Datei in Trimble Geomatics Office:

a.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

b.	Wählen Sie im Register Vermessung die Option Datenrekorder-Dateien anderer Hersteller. Das Dialogfeld Öffnen erscheint.

c.	Wählen Sie die Datei, die Sie importieren möchten.

d.	Wählen Sie im Feld Typ die Option Autodesk FBK Feldbuch-Formatdateien (*.FBK), und klicken Sie auf OK.

Die Datei wird in das Trimble Geomatics Office Projekt importiert.

HINWEIS: Das Autodesk Softdesk-Feldbuchformat ist nachstehend beschrieben. Die Beschreibung dieses Formats ist aus den Hilfedateien des AutoCAD Land Desktop entnommen.

  Jede Formatzeile, die nicht mit einem der erkannten Befehle beginnt, wird ignoriert.

  Elemente in Klammern () sind optional.

  Für Trimble Geomatics Office müssen Sie eine Punktnummer verwenden.

  Die Punktbeschreibung (Beschreib) muß in doppelten Anführungszeichen (") als Teil der Feldbuchformat-Dateidefinition angegeben werden. Das bedeutet, daß Leerstellen in der Punktbeschreibung verwendet werden können.


Befehle zur Erstellung von Punkten

AD (Punkt) [Winkel] [Strecke] (Beschreib)

AD [VW] (Punkt) [Winkel] [Strecke] [Vert Winkel] (Beschreib)

AD [VS] (Punkt) [Winkel] [Strecke] [Vert Strecke] (Beschreib)

BD (Punkt) [Richtungswinkel] [Quadrant] [Strecke] (Beschreib)

BD [VW] (Punkt) [Richtungswinkel] [Quadrant] [Strecke] [Vert Winkel] (Beschreib)

BD [VW] (Punkt) [Richtungswinkel] [Quadrant] [Strecke] [Vert Str] (Beschreib)

DD (Punkt) [Winkel] [Strecke] [Vert Winkel] (Beschreib)

DD [VW] (Punkt) [Winkel] [Strecke] [Vert Winkel] (Beschreib)

DD [VS] (Punkt) [Winkel] [Strecke] [Vert Strecke] (Beschreib)

F1/F2 (Punkt) [Winkel] [Strecke] (Beschreib)

F1/F2 [VW] (Punkt) [Winkel] [Strecke] [Vert Winkel] (Beschreib)

F1/F2 [VS] (Punkt) [Winkel] [Strecke] [Vert Strecke] (Beschreib)

NE (Punkt) [Hochw] [Rechtsw] (Beschreib)

NEZ (Punkt) [Hochw] [Rechtsw] (Höhe) (Beschreib)

NE SS (Punkt) [Hochw] [Rechtsw] (Höhe) (Beschreib)

PRISM [ellips. Höhe]

PT OFFSET (Punkt) [Offset] (voraus)

STADIA (Punkt) [Winkel] [Strecke] [Stab] (Vert Winkel) (Beschreib)

ZD (Punkt) [Azimut] [Strecke] (Beschreib)

ZD [VA] (Punkt) [Azimut] [Strecke] [Vert Winkel] (Beschreib)

ZD [VD] (Punkt) [Azimut] [Strecke] [Vert Strecke] (Beschreib)


Befehle zur Punktlokalisierung

AZ [Punkt 1] [Punkt 2] [Azimut]

BS [Punkt] (Orientierung)

STN [Punkt] (Instr.höhe) (Beschreib)


Befehle für die Ausrüstungskorrektur

ANGLES [RECHTS, LINKS] [ZENITH, NADIR, HORIZ]

ATMOS [AN, AUS]

CR [AN, AUS]

EDM OFFSET  [Offset]

HORIZ ANGLE [RECHTS, LINKS]

PRESS [Druck] [INCH, MBAR, MM]

SF [Faktor]

PRISM CONSTANT  [Konstante]

PRISM OFFSET  [Offset]

TEMP [Temperatur] [F, C, K]

UNITS [METER, FUß] [DMS, DEZGRAD, GRAD, MIL, RADIANS]

VERT ANGLE [ZENITH, NADIR, HORIZ]


Koordinaten im Eigenschaftsfenster hinzufügen

In Trimble Geomatics Office können Sie Koordinaten für einen Punkt im Eigenschaftsfenster mit Hilfe der Schaltfläche Koordinate hinzufügen [image] in der Seite Zusammenfassung hinzufügen.

So fügen Sie eine Koordinate hinzu:

1.	Doppelklicken Sie auf den Punkt im Projekt. Das Eigenschaftsfenster erscheint.

2.	Wählen Sie [image] in der Seite Zusammenfassung und dann den Koordinatentyp, den Sie hinzufügen möchten: Gitter, Örtlich oder WGS-84.

In der Baumstruktur des Eigenschaftsfensters erscheint eine neue Koordinate unter dem gewählten Punkt. Dem Punktnamen wird ein Präfix vorangestellt, das angibt, ob es sich um eine Gitter-, örtliche oder WGS-84 (W) Koordinate handelt. In der Seite Zusammenfassung wird in allen Feldern für die neue Koordinate der Wert Null angezeigt.

HINWEIS: Sie können nur eine WGS-84 Koordinate und nur eine Gitter- oder örtliche Koordinate für jeden Punkt hinzufügen. Wenn Sie eine WGS-84 Koordinate hinzufügen, steht diese Option in der Liste Koordinate hinzufügen nicht länger zur Verfügung. Wenn ein Punkt sowohl eine WGS-84 Koordinate als auch eine Gitter- oder örtliche Koordinate hat, ist die Schaltfläche Koordinate hinzufügen nicht verfügbar.

3.	Wenn die Felder Hochwert, Rechtswert, Höhe und Ellips Höhe für die Koordinate ausgefüllt werden sollen, klicken Sie zuerst in jedes Feld, und dann auf die Schaltfläche Aktuellen Wert einfügen [image]. Jedes Feld wird mit der aktuellen Punktposition und -qualität ausgefüllt. Sie können diese Informationen bearbeiten, falls erforderlich.

TIP: Fügen Sie nur dann eine Koordinate hinzu, wenn Sie sicher sind, daß Sie diese Koordinate anstelle von Beobachtungen verwenden möchten. Bei Neuberechnungen werden eingegebene Koordinaten Beobachtungen mit derselben Qualität vorgezogen. Dadurch wird sichergestellt, daß der Sollpunkt Vorrang vor einer Absteckungsbeobachtung hat.

HINWEIS: Zusätzliche Koordinaten können von Trimble Geomatics Office erzeugt und für einen Punkt gespeichert werden:

  Koordinaten, die aus einer Ausgleichung abgeleitet wurden

  WGS-84 Koordinaten, die für eine Kalibrierung gespeichert wurden


Koordinaten im Eigenschaftsfenster bearbeiten

 Überblick und weitere Informationen

In Trimble Geomatics Office können Sie die Koordinaten eines Punktes im Eigenschaftsfenster bearbeiten.

So bearbeiten Sie die Koordinaten:

1.	Doppelklicken Sie auf den Punkt im Projekt. Das Eigenschaftsfenster erscheint.

2.	Expandieren Sie die Baumstruktur des Punktes im Eigenschaftsfenster (klicken Sie auf das Pluszeichen), und wählen Sie die eingegebene Koordinate (WGS-84 oder Gitter/Örtlich), die Sie bearbeiten möchten.

3.	Bearbeiten Sie die Koordinatenkomponenten und die Koordinatenqualität.

HINWEIS: Damit das Koordinatenfeld bearbeitet werden kann, müssen die Einstellungen für die Koordinatenansicht und für den Koordinatentyp identisch sein.

4.	Nachdem Sie die Koordinate bearbeitet haben, wählen Sie Vermessung / Neu berechnen, um eine Neuberechnung durchzuführen.

Weitere Informationen über das Hinzufügen und die Bearbeitung von Koordinaten im Eigenschaftsfenster finden Sie unter dem Thema Eigenschaftsfenster − Koordinaten.


Digitale Nivellier-Dateien importieren

Das Dialogfeld Digitales Nivellier importieren erscheint, wenn Sie Digitale Nivellier-Dateien(*.dat, *.raw) importieren oder Dateien mit einem DiNi-Digitalnivellier (unter Verwendung der Option Vermessungsgeräte) herunterladen. So importieren Sie die Dateien:

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Digitale Nivellier-Dateien (*.dat, *.raw), und klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie die digitale Nivellier-Datei. Das Dialogfeld Digitales Nivellier importieren erscheint.

4.	Definieren Sie die Standpunkte im Dialogfeld Digitales Nivellier importieren, indem Sie das Kontrollkästchen in der Spalte Standpunkte wählen.

Zwischen Standpunkten werden Höhenunterschiede berechnet. Wenn Standpunkte importiert werden, werden sie mit anderen Punkten gleichen Namens kombiniert. Vergewissern Sie sich, daß die Punktnamen eindeutig sind. Sie können die Punktnamen im Dialogfeld Digitales Nivellier importieren bearbeiten.

HINWEIS: Punkte, die nicht als Standpunkte definiert sind, werden nicht importiert.

5. 	Geben Sie im Dialogfeld Digitales Nivellier importieren eine orthometrische Höhe für die Startpunkte ein. Diese Höhe wird zur Berechnung der Höhen für andere Punkte verwendet. Klicken Sie auf einen beliebigen Punkt in der Schleife, um die Startpunkthöhen zu bearbeiten. Die Startpunkthöhe der Schleife wird in der Gruppe Höhe angezeigt. Bearbeiten Sie die Höhe und die Qualität in der Gruppe Höhe, und klicken Sie auf OK. Die Höhe wird für alle Standpunkte berechnet. Verwenden Sie diese berechneten Höhen, um bekannte Werte und Daten auf ihre Gültigkeit zu überprüfen.

HINWEIS: Es werden nur orthometrische Höhen mit dem Höhensymbol importiert. Für alle anderen Standpunkte werden Höhenunterschiede importiert. Die orthometrischen Höhen dieser Punkte werden bei einer Neuberechnung bestimmt.

TIP: Alle Änderungen, die Sie im Dialogfeld Digitales Nivellier importieren vornehmen, betreffen ausschließlich die importierten Daten. Die Änderungen haben keinerlei Auswirkungen auf die Digitale Nivellier-Datei (*.dat, *.raw).

6.	Klicken Sie auf OK. Die digitale Nivellier-Datei wird importiert.

HINWEIS: Die importierten Beobachtungen haben möglicherweise keine horizontalen Koordinaten und werden daher  womöglich nicht im Graphikfenster angezeigt. Wenn Sie die Nivellierbeobachtungen im Eigenschaftsfenster ansehen möchten, wählen Sie die Dateien mit einem der Auswahl-Symbole, und öffnen Sie dann das Eigenschaftsfenster. Führen Sie dazu einen der nachfolgenden Schritte aus:

  Wählen Sie Bearbeiten / Eigenschaften

  Wählen Sie das Symbol Eigenschaften bearbeiten [image] in der Symbolleiste.

TIP: Wenn Sie digitale Nivellierdaten erfassen, die später importiert werden sollen, empfiehlt Trimble, daß Sie die Punkte, die in Trimble Geomatics Office importiert werden sollen, mit einem eindeutigen Präfix oder Suffix speichern. Speichern Sie z. B. alle Punkte, die als Standpunkte verwendet werden sollen, mit dem Präfix STN. Dadurch wird die Punktauswahl mit der Schaltfläche Nach Filter wählen im Dialogfeld Digitales Nivellier importieren einfacher.


Eine Hintergrundkarte in Trimble Geomatics Office ansehen

 Überblick und weitere Informationen

So können Sie eine Hintergrundkarte in Trimble Geomatics Office ansehen:

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Klicken Sie im Register Hintergrundkarte auf Hinzufügen. Das Dialogfeld Hinzufügen erscheint.

3.	Wählen Sie Datei für die Hintergrundkarte, und klicken Sie auf OK.

HINWEIS: Trimble Geomatics Office kann Hintergrunddateien im Graphikfenster anzeigen. Sie können Drawing Exchange Format (.dxf), Windows Bitmap (.bmp) oder Tagged Image File Format (.tif) Dateien als Hintergrunddateien importieren. Windows Bitmap (.bmp) und Tagged Image File Format (.tif)-Dateien müssen georeferenziert sein, um korrekt angezeigt zu werden. Das ESRI Weltdateiformat wird für die Georeferenzierung von Hintergrunddateien verwendet. Diese Dateien müssen im selben Ordner gespeichert werden, wie die entsprechenden Hintergrunddateien.

Die Datei für die Hintergrundkarte erscheint in Trimble Geomatics Office.

Weitere Informationen über die Verwendung von Hintergrundkarten in Trimble Geomatics Office finden Sie unter Ansichtsoptionen − Hintergrundkarte.


Gitterlinien in Trimble Geomatics Office anzeigen

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie im Register Gitterlinien das Kontrollkästchen Gitterlinien anzeigen. Die Optionen in dieser Gruppe werden verfügbar.

3.	Wählen Sie die Option Feste Anzahl an Gitterlinien oder die Option Gitterintervall, und geben Sie die entsprechenden Werte in jedes Feld ein.

4.	Wählen Sie den Gitterlinientyp und die Gitterlinienfarbe.

5.	Wenn die Gitterlinien beschriftet werden sollen, aktivieren Sie das Kontrollkästchen Gitterlinien beschriften.

6.	Klicken Sie auf OK.


Unabhängige Basislinien auswählen

Ein Satz unabhängiger Basislinien besteht aus der Mindestanzahl von Basislinien, die erforderlich sind, um alle Punktbesetzungen in einer gegebenen GPS-Feldsitzung zu verbinden. Für einen beliebigen Satz von n gleichzeitigen GPS-Punktbesetzungen existieren n – 1 unabhängige Basislinien. In einer Feldsitzung mit fünf Empfängern gibt es z. B. 10 potentielle Basislinien, aber nur 4 unabhängige Basislinien. Die unabhängigen Basislinien sind im nachstehend abgebildeten Diagramm durch gestrichelte Linien dargestellt.

Der Begriff unabhängiger Basisliniensatz wird vor allem für Vermessungen verwendet, die mit statischen oder FastStatic-Methoden durchgeführt werden und ist besonders wichtig für Projekte, bei denen eine Netzausgleichung durchgeführt wird.

Durch die Verwendung unabhängiger Basisliniensätze wird sichergestellt, daß sich bei einer Netzausgleichung keine  künstlich vergrößerte Redundanz (zu große Freiheitsgrade) ergibt. Dies würde dazu führen, daß die Fehler in den ausgeglichen Koordinaten unterschätzt werden.

Die Basislinien, die aus GPS-Feldsitzungen mit mehr als zwei Empfängern abgeleitet werden, können in mehrere unabhängige Basisliniensätze eingeteilt werden. Die Unterteilung der Basislinien in unabhängige Sätze kann nach der Qualität der Basislinienlösungen oder im Hinblick auf eine bestimmte Netzgeometrie erfolgen.

Sie haben mehrere Möglichkeiten, um einen unabhängigen Basisliniensatz auszuwählen:

  Wählen und verarbeiten Sie nur einen unabhängigen Satz von Basislinien aus allen potentiellen Basislinien einer GPS-Feldsitzung.

  Verarbeiten Sie alle potentiellen Basislinien einer GPS-Feldsitzung, und wählen Sie einen unabhängigen Satz, wenn Sie die Resultate im Projekt speichern.

  Verarbeiten Sie alle potentiellen Basislinien einer GPS-Feldsitzung, und speichern Sie alle Resultate im Projekt. Schließen Sie dann die Basislinien aus einer Netzausgleichung aus.

Verwenden Sie dazu das Symbol Ansicht abhängige Basislinien [image], um die Beobachtungen im Graphikfenster und in Timeline zu verbinden. Wenn Sie dieses Symbol wählen, werden in der Software in der aktuellen Timeline-Ansicht nur nachverarbeitete Basislinien und nachverarbeitete Basislinien, die zur gleichen Zeit beobachtet wurden, angezeigt. Alle anderen nachverarbeiteten Basislinien sind in der Vermessungsansicht ausgeblendet. Verwenden Sie das Symbol Ansicht abhängige Basislinien, um Basislinien anzuzeigen, die gleichzeitig beobachtet wurden, und um die abhängigen Basislinien aus der Netzausgleichung auszuschließen.

Führen Sie dazu einen der folgenden Schritte aus:

  Stellen Sie im Eigenschaftsfenster den Status der abhängigen Basislinien auf Deaktiviert ein.

  Stellen Sie im Eigenschaftsfenster den Status der abhängigen Basislinien auf Als Prüfpunkt aktiviert ein.

  Deaktivieren Sie im Eigenschaftsfenster das Kontrollkästchen Bei der Netzausgleichung verwenden für alle abhängigen Basislinien.

  Verwenden Sie das Dialogfeld Beobachtungen, um das Kontrollkästchen Verwenden für alle abhängigen Basislinien zu deaktiveren.

Diese Vorgänge können am besten im Dialogfeld Mehrfachbearbeitung durchgeführt werden. Wenn Sie z. B. den Status einer abhängigen Basislinie auf Deaktiviert einstellen möchten:

1.	Wählen Sie das Symbol Ansicht abhängige Basislinien.

2.	Wählen Sie die abhängigen Basislinien im Graphikfenster.

3.	Wählen Sie Bearbeiten / Mehrfachbearbeitung. Das Dialogfeld Mehrfachbearbeitung erscheint.

4.	Wählen Sie das Kontrollkästchen Beobachtungsstatus setzen auf.

5.	Wählen Sie aus der Liste die Option Deaktiviert, und klicken Sie auf OK.

Die ausgewählten Beobachtungen haben nun den Status Deaktiviert.


Eine Trimble 3600/5600 GDM-Datei importieren

HINWEIS: Importieren Sie zuerst die Area-Datei, wenn sowohl in der Projektdatei, als auch in der Area-Datei Vermessungsdaten enthalten sind.

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Trimble 3600/5600 GDM-Dateien (*.job, *.are), und klicken Sie auf Optionen. Das Dialogfeld Optionen erscheint.

3.	Legen Sie die Einstellungen für doppelte Punkte für die Trimble 3600/5600 GDM-Kontrolleinheit fest.

4.	Klicken Sie auf OK, um die Änderungen zu akzeptieren und zum Dialogfeld Importieren zurückzukehren.

5.	Klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

6.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.

HINWEIS: Trimble Geomatics Office geht davon aus, daß alle 3600/5600 GDM-Dateien als Dateien mit einem Nur-Maßstab-Koordinatensystem definiert sind. Weitere Informationen finden Sie unter Nur-Maßstab.

Siehe auch


Eine Trimble 3600/5600 GDM Area-Datei (*.are) exportieren

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Trimble 3600/5600 GDM-Dateien (*.job, *.are), und klicken Sie auf Optionen. Das Dialogfeld Optionen erscheint.

3.	Legen Sie die Einstellungen für die Trimble 3600/5600 GDM-Kontrolleinheit fest.

4.	Klicken Sie auf OK, um die Änderungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

5.	Klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

6.	Geben Sie einen Pfad und Dateinamen ein, und klicken Sie auf Speichern (Gemäß Voreinstellung ist der Dateiname der Name des Projekts).

HINWEIS: Für die zur Area-Datei exportierten Koordinaten wird das im Trimble Geomatics Office-Projekt definierte Koordinatensystem verwendet.

Siehe auch


Eine Pcode-Datei (*.pco) zu einem Trimble 3600/5600 GDM-Instrument exportieren
Eine Pcode-Datei (*.pco) zu einem Trimble 3600/5600-Instrument exportieren

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Pcode-Datei zu 3600/5600 GDM (*.pco), und klicken Sie auf OK. Das Dialogfeld Optionen erscheint. Das Dialogfeld Wählen erscheint.

3.	Wählen Sie eine Pcode-Datei, und klicken Sie auf Öffnen. Das Dialogfeld Data Transfer Speichern unter erscheint.

4.	Wählen Sie ein Trimble 3600/5600 GDM-Gerät, und klicken Sie auf Öffnen. Das Dialogfeld Verbinde erscheint. Nachdem eine Verbindung hergestellt wurde, erscheint das Dialogfeld Speichern unter.

5.	Klicken Sie auf Speichern. Ein Statusdialogfeld zeigt den Status der Übertragung an. Nach dem Abschluß der Übertragung wird die Verbindung zum Gerät unterbrochen.

Siehe auch


Importieren - Überblick
Importieren − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch

Überblick

Sie können Daten in einer Reihe von Dateiformaten in ein Trimble Geomatics Office-Projekt importieren. Sie können z. B. Dateien importieren, die Festpunkte, GPS-Rohdateien (*.dat), Survey Controller-Dateien (*.dc), und benutzerdefinierte Formate enthalten.

Eine Beschreibung der unterstützten Importformate finden Sie unter dem Thema Dialogfeld Importieren.

Sie können Daten importieren von:

  einem Gerät, auf dem die Trimble Survey Controller Software ausgeführt wird

  einem Trimble GPS-Empfänger

  einem Trimble 3600/5600 GDM-Instrument

  einer Datei in einem Computer

  einer Totalstation

  einem Digitalnivellier

Wenn eine Datei importiert wird, werden die Punkte in der Datei zur Datenbank hinzugefügt. Wenn ein Punkt importiert wird, der den gleichen Namen besitzt, wie ein Punkt, der bereits in der Datenbank vorhanden ist, hängt die Art und Weise, in der Punkte kombiniert werden, von der eingestellten Option im Dialogfeld Optionen doppelte Punkte ab.

Was geschieht, wenn Sie eine Datei importieren, ist abhängig vom Dateityp. Es wird jedoch bei allen Dateitypen automatisch eine Neuberechnung durchgeführt sowie ein Import-Bericht (namens <importierter Dateiname>.html) erzeugt und im Ordner Berichte (Reports) des Projekts gespeichert.

Alle Elemente, die aus einer Datei importiert wurden, werden in einer Auswahlmenge gespeichert. Bei .dc-Dateien wird die Auswahlmenge nach dem internen Projektnamen in der Datei benannt. Bei anderen Dateitypen erhält die Auswahlmenge den Namen der Import-Datei. Verwenden Sie Wählen / Befehl Auswahlmengen zur Verwaltung der Auswahlmengen.

TIP: Wenn Sie nur Daten in einer Auswahlmenge ansehen möchten, verwenden Sie die Option Nur Daten in Auswahlmenge anzeigen im Dialogfeld Ansicht Filter.

TIP: Um einen Importvorgang rückgängig zu machen, verwenden Sie den Befehl Rückgängig. Wenn Sie das Projekt nach dem Importieren geschlossen haben, verwenden Sie die Option Aus Quelle(n) im Dialogfeld Punkte wählen / Register Allgemein, und löschen Sie die Auswahl, um den Importvorgang rückgängig zu machen.

HINWEIS: Wenn Sie eine Datei mehr als einmal in das gleiche Projekt importieren, wird die Datei mit einem Strich und einer Nummer am Ende des Dateinamens zum entsprechenden Ordner hinzugefügt. Wenn Sie z. B. eine Trimble GPS-Rohdatendatei namens MeineGPSDatei zweimal importieren, wird ein Ordner namens MeineGPSDatei (beim ersten Importieren der Datei) erzeugt. Dieser Ordner enthält die Dateien MeineGPSDatei.dat und MeineGPSDatei-1.dat. Doppelte Daten werden beim Importieren identifiziert und nicht zur Datenbank hinzugefügt.


Dialogfeld Importieren

Verwenden Sie dieses Dialogfeld, um Daten in Ihr Projekt zu importieren.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Importieren.

  Klicken Sie auf die Schaltfläche Importieren [image] in der Standard-Symbolleiste.

Die Importformate werden in drei Registern verwaltet:

  Vermessung

  CAD / ASCII

  Benutzerdefiniert

Neues Format

Diese Schaltfläche wird verfügbar, wenn das Register Benutzerdefiniert gewählt wird.

Klicken Sie auf Neues Format, um ein neues benutzerdefiniertes Format zu erzeugen. Das Dialogfeld ASCII-Importformat definieren erscheint.

Verwenden Sie dieses Dialogfeld zur Definition des Importformats.

Format bearbeiten

Diese Schaltfläche wird verfügbar, wenn das Register Benutzerdefiniert gewählt wird.

Klicken Sie auf Format bearbeiten, um bestehende ASCII-Importformate zu ändern.

Das Dialogfeld ASCII-Importformate definieren erscheint.

Verwenden Sie dieses Dialogfeld, um das Importformat zu bearbeiten.

Format löschen

Diese Schaltfläche wird verfügbar, wenn das Register Benutzerdefiniert gewählt wird.

Klicken Sie auf Löschen, um ein benutzerdefiniertes Importformat zu löschen. Sie werden aufgefordert, den Vorgang zu bestätigen.

Klicken Sie auf Ja, um den Löschvorgang zu bestätigen.

Benutzerdefiniert

Verwenden Sie die Schaltfläche Benutzerdefiniert (Customize), um die Liste mit der Importoptionen im Dialogfeld Importieren auszuwählen. Wählen Sie die benötigen Importoptionen aus der Liste mit den Kontrollkästchen.

Sie können einen externen Filter zum Dialogfeld Vermessung Externe Importfilter hinzufügen. Externe Filter sind separate Programme, die Sie erstellen und in Trimble Geomatics Office integrieren können. Jeder externe Filter, der für die Verwendung in Trimble Geomatics Office geschrieben wird, muß bestimmte Voraussetzungen erfüllen, damit er zum System hinzugefügt werden kann. Es werden nur die gerade installierten Filter im gewählten Register des Dialogfelds Importieren angezeigt.

Jedes Filter-Programm muß als Dynamically Linked Library (*.dll) mit bestimmten exportierten Funktionen kompiliert und als COM (Component Object Module)-Objekt erstellt werden.

Wenn Sie die geeignete Datei wählen, registriert Trimble Geomatics Office das COM-Filterobjekt im Computer und prüft, ob das .dll-Interface den Systemanforderungen entspricht. Ist dies nicht der Fall, informiert Sie das System, daß der Filter nicht registriert werden kann. Wenn der Filter erfolgreich installiert wird, erscheint eine kurze Beschreibung des Filters im Dialogfeld.

Weitere Informationen finden Sie unter Externe Import-/Exportfilter.

Optionen

Klicken Sie für die importierte Datei auf Optionen, um:

  festzulegen, wie doppelte Punkte beim Importieren gehandhabt werden sollen.

  die Qualität für importierte Daten festzulegen.

  die Einheiten für importierte Daten festzulegen.

  die Einstellungen in der importierten Datei festzulegen.

  die Optionen für die Datenübertragung zu einem Gerät, einem 3300/3600/5600 Elta M5 oder einem 3600/5600 GDM festzulegen.

Wenn Sie ein Koordinatensystem wählen, das sich von dem des Projekts unterscheidet, liest Trimble Geomatics Office die Datei, konvertiert die Koordinaten in das Projekt-Koordinatensystem, speichert die Punkte und zeigt sie im Projekt-Koordinatensystem an. Die Datendatei bleibt unverändert.

HINWEIS: Die Koordinatenwerte, die in Trimble Geomatics Office für Punkte aus der importierten Datei dargestellt werden, können sich von denen in der Datei unterscheiden.


Importformate - Register Vermessung
Importformate − Register Vermessung

 Überblick und weitere Informationen

Verwenden Sie das Register Vermessung, um Daten von einem Trimble Survey Controller, einem Trimble GPS-Empfänger oder Vermessungsdateien in einen Computer zu importieren.

So greifen Sie auf das Register Importieren / Vermessung zu:

1.	Wählen Sie Datei / Importieren.

2.	Wählen Sie das Register Vermessung.

Sie können benutzerdefinierte Formate in dieses Register verschieben. Weitere Informationen finden Sie unter Asciiimp.dat-Datei.

HINWEIS: Sie können zudem die Drag-Drop-Funktion verwenden, um die Datei durch Ziehen und ablegen zu importieren.

Verwenden Sie das Register Vermessung, um die folgenden Formate zu importieren:

Format	Verwenden Sie dieses Format um folgendes zu importieren …
Digitale Nivellier-Dateien (*.dat, *.raw)	Digitale Nivellier-Dateien.
GPS-Dateien (*.dat)	Trimble GPS .dat-Dateien von Ihrem Computer.
Gitter-DGM-Datei (*.dtx)	Ein Gitter-Digitales Geländemodell, das mit dem DTMLink-Programm erstellt wurde.
NGS-Datenblatt-Dateien (*.dat, *.dsx, *.htm, *.html)	National Geodetic Survey (NGS) Standard-Format-Dateien.
Trimble Datenaustauschformat	Eine ASCII-Datei mit Daten im Trimble Datenaustauschformat. Dieses Format wird verwendet, um Vermessungsdaten zu anderen Softwarepaketen zu übertragen.
Genaue Ephemeriden-Dateien (*.sp3, *.e18)	Eine Datei mit genauen Ephemeriden zur Verwendung bei der Basislinienverarbeitung. Diese Datei wird im Ordner Gemeinsame Dateien gespeichert. Verwenden Sie das Dialogfeld GPS-Verarbeitungsstile, um die Datei zu wählen.
RINEX-Dateien (*.Xxo, *.XXn, *.obs, *.nav)	Dateien im Receiver Independent Exchange-Format. Mit diesem Format können Sie GPS-Rohdatendateien von GPS-Empfängern anderer Hersteller übertragen. Dafür müssen sich eine Navigationsdatei und eine Beobachtungsdatei im selben Ordner befinden.
Sokkia Datenrekorder-Dateien (*.sdr)	Eine Sokkia Datenrekorder-Datei von einem Computer.
SSF/SSK-Dateien (*.ssf, *.ssk)	Nachverarbeitete kinematische Lösungsdateien oder nachverarbeitete statische Lösungsdateien, die mit der Trimble GPSurvey-Software erstellt wurden.
Survey Controller-Dateien (*.dc)	Eine Trimble Survey Controller-Formatdatei von einem Computer. Beim Importieren von .dc-Dateien werden alle GPS-Basislinien oder Beobachtungen mit assoziierten Antennen-, Instrumenten- und Prismenhöhen im Projekt gespeichert. Diese Dateien werden zur Berechnung verwendet.
Vermessungsgeräte	Daten direkt von unterstützten Totalstationen, Geräten, Survey Data Cards und GPS-Empfängern.
Datenrekorder-Dateien anderer Hersteller	Datenrekorderdateien anderer Hersteller mit einem externen Import-/Exportfilter. Die folgenden Formate anderer Hersteller werden mit Trimble Geomatics Office geliefert: Leica GS1-16 SDMS (importiert koordinierte Punkte) Nikon AP-700 ASCII-Daten Topcon GTS-700 und FC-5 Formatdaten
Trimble 3600/5600 GDM-Dateien (*.job, *.are)	Trimble 3600/5600 GDM-Dateien
TDS Survey Pro CE-Projektdateien (*.job)	Importiert TDS Survey Pro CE-Projektdateien
TDS Survey Pro CE-Rohdatendateien (*.raw)	Importiert TDS Survey Pro CE-Rohdatendateien
Trimble 3300 / 3600 / 5600 Elta M5-Dateien (*.dat)	Importiert 3300 / 3600 / 5600 Elta M5-Dateien
Trimble 3600 / 5600 TDS-Koordinatendateien (*.cr5)	Importiert Trimble 3600 / 5600 TDS-Koordinatendateien
Trimble 3600 / 5600 TDS-Rohdatendateien (*.rw5)	Importiert Trimble 3600 / 5600 TDS-Rohdatendateien
Trimble Elta GPS Controller M5-Dateien (*dat)	Importiert Trimble Elta GPS Controller M5-Dateien


Option NGS-Datenblatt-Datei (*.dat, *.dsx, *.htm, *.html)

Sie können National Geodetic Survey (NGS)-Dateien im Standardformat importieren.

Alle NGS-Daten, die in ein Projekt in Trimble Geomatics Office importiert werden, müssen das NAD-83-Datum haben (das heißt, mit einem WGS-84-Datum übereinstimmen).

Wenn Sie NGS-Daten in ein Projekt importieren, die nicht erkennbar auf einem NAD-83-Datum basieren, kann Trimble Geomatics Office nicht sicherstellen, daß die NGS-Daten geeignet sind.

HINWEIS: Trimble Geomatics Office erkennt ein NAD-83-Datum am Namen (das heißt, jedes Datum, das mit NAD-83 beginnt).

Wenn Ihr Datum nicht dem NAD-83-Datum entspricht, erscheint die folgende Warnung:

Ihr Projekt hat möglicherweise kein NAD-1983-Datum. Dies wird zu Problemen führen, da die importierten Daten in einem NAD 1983-Datum sind und das Projektdatum nicht konvertiert wird.

Möchten Sie mit dem Importieren fortfahren?

WARNUNG: Wenn Sie mit dem Importieren fortfahren, werden die NGS-Koordinaten unter Verwendung des jeweils für das Projekt definierten Datums interpretiert. Wenn dieses Datum nicht dem NAD-83-Datum entspricht, ist diese Interpretation falsch.


CAD / ASCII-Importformate

So greifen Sie auf das Register Importieren / CAD/ASCII zu:

1.	Wählen Sie Datei / Importieren.

2.	Wählen Sie das Register CAD/ASCII.

HINWEIS: Bei allen Importformaten für ASCII-Dateien wird davon ausgegangen, daß numerische Daten in standardisierter Form importiert werden. Die standardisierte Form enthält keine Tausender-Trennzeichen und keine Punkte für den Dezimalpunkt.

Sie können benutzerdefinierte Formate in dieses Register verschieben. Weitere Informationen finden Sie unter Asciiimp.dat-Datei.

HINWEIS: Sie können zudem die Drag-Drop-Funktion verwenden, um die Datei durch Ziehen und ablegen zu importieren.

Verwenden Sie das Register CAD/ASCII, um die folgenden Formate zu importieren:

Format	Verwenden Sie dieses Format, um folgendes zu importieren …
AutoCAD-Datei (*.dwg, *.dxf)	Koordinierte Punkte und Liniennetze unter Verwendung von ASCII- und binären .dxf- und .dwg-Dateien (bis .dxf Release 14).
C & G Standardformat	Eine Standard C & G Software ASCII-Datei.
C & G ohne Anführungszeichen	Eine C & G Software ASCII-Datei ohne Anführungszeichen.
CMM COR und LEV-Dateien (*.cor, *.lev)	Standard ASCII-Formatdateien, die vom Bureaux of Land Management verwendet werden. Die Option CMM COR und LEV-Dateien wird unter Verwendung eines externen Importfilters bereitgestellt.
NMEA-Datei	Punkte aus NMEA-Formatdateien (GGA, GGK und PJK Strings). NMEA ist ein von der National Marine Electronics Association entwickelter Standard, der Datenformate für die Übertragung von Navigationsdaten zwischen Seenavigationsinstrumenten definiert.
Pacsoft-Format	Eine Standard Pacsoft Software ASCII-Datei.
SDRmap-Koordinaten	Eine SDRmap-Koordinaten-Textdatei.
TPLANE (LLHE)	Eine Trimble GPSurvey ASCII-Datei.
TRIMMAP-Graphikdatei (*.tgf)	Eine TRIMMAP (oder SDRmap) *.tgf-Graphikdatei.
WILDsoft-Format	Eine Standard WILDsoft Software ASCII-Datei.
Terramodel-Projektdateien (*.pro)	Punkte, Liniennetze und Layer aus Terramodel-Projektdateien.


Benutzerdefinierte Importformate

So greifen Sie auf das Register Importieren / Benutzerdefiniert zu:

1.	Wählen Sie Datei / Importieren.

2.	Wählen Sie das Register Benutzerdefiniert.

HINWEIS: Sie können zudem die Drag-Drop-Funktion verwenden, um die Datei durch Ziehen und ablegen zu importieren.

Sie können benutzerdefinierte Formate in andere Register verschieben. Weitere Informationen finden Sie unter Asciiimp.dat-Datei.

Verwenden Sie das Register Benutzerdefiniert, um:

  Dateien in einem benutzerdefinierten Format zu importieren

  neue benutzerdefinierte Importformate hinzuzufügen

  bestehende benutzerdefinierte Importformate zu bearbeiten

  benutzerdefinierte Importformate zu löschen.

Die folgenden benutzerdefinierten Formate stehen zur Verfügung:

  Punkte mit Trennzeichen

  Punkte mit fester Breite

  Name,Rechtsw,Hochw,Höhe,Code

  Name,Breite,Länge,EllH,Code (Örtlich)

  Name,Breite,Länge,EllH,Code (WGS-84)

  Name,Rechtsw,Hochw,Höhe,Code

Wenn Werte aus einer ASCII-Datei importiert werden, kann Trimble Geomatics Office Werte lesen, die die unter Microsoft Windows Systemsteuerung / Ländereinstellungen / Register Zahlen definierten Tausender-Trennzeichen und Dezimaltrennzeichen enthalten. Das System wird zudem die Werte in einer standardisierten Form einlesen, d.h. ohne Zifferngruppierungssymbol (Tausender-Trennzeichen) sowie mit einem Punkt als Dezimaltrennzeichen.

Alle benutzerdefinierten Importformate werden in die Asciiimp.dat-Datei geschrieben.


Dialogfeld ASCII-Importformat definieren

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um ASCII-Importformate zu definieren.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Führen Sie im Register Benutzerdefiniert einen der folgenden Schritte aus:

  Klicken Sie auf Neues Format, um ein neues Format zu erzeugen.

  Klicken Sie auf Format bearbeiten, um ein bestehendes Format zu ändern.

Name

Geben Sie den Namen des Importformats ein, oder bearbeiten Sie ihn. Dieser Name erscheint in der Liste der Dateitypen im Register Benutzerdefiniert des Dialogfelds Importieren. Doppelte Namen sind nicht erlaubt.

Null-String

Geben Sie den Null-String für die Definition des Importformats ein. Dieses Feld ist optional. Der hier angegebene Null-String wird beim Dateiimport interpretiert, um darauf hinzuweisen, daß für einen bestimmten Datensatz kein Wert verfügbar ist.

Wenn Trimble Geomatics Office den angegebenen Null-String findet, wird dem entsprechenden Datenbankfeld kein Wert zugeordnet, da die Daten zur Datenbank hinzugefügt werden.

HINWEIS: Für einige Dateitypen kann ein bestimmter String erforderlich sein, wie z. B. "99999.99", "*****" oder ein ähnlicher String. Sie können Trimble Geomatics Office vorschreiben, einen bestimmten String zu verwenden, indem Sie die Einstellung festlegen.

Beschreibung

Geben Sie eine Beschreibung des Importformats ein. Die Beschreibung erscheint in der Statusleiste, wenn das Format im Dialogfeld Importieren hervorgehoben wird. Dieses Feld ist optional.

Standard-Erweiterung

Geben Sie die Standard-Erweiterung für das Importformat ein, wie z. B. .dat oder.fbk. Dieses Feld ist optional. Falls es nicht ausgefüllt wird, wird ‘".txt" vorausgesetzt.

TIP: Geben Sie ??? ein, um alle Dateierweiterungen zu akzeptieren.

HINWEIS: Trimble Geomatics Office verwendet die Erweiterung des Felds Dateityp im Dialogfeld Öffnen. Es gibt den/die Namen der Datei(en) mit der angegebenen Erweiterung in die Namensliste ein. Trimble Geomatics Office geht davon aus, daß ein Punkt zwischen dem Namen und der Erweiterung eingegeben wird.

Importieren als

Wählen Sie den entsprechenden Datensatztyp als Ziel für die Daten in der(den) Import-Datei(en) aus. Dies ist normalerweise die Punktetabelle.

Format automatisch ausfüllen

Klicken Sie auf Format automatisch ausfüllen, und das Dialogfeld Format hinzufügen wird geöffnet. Verwenden Sie dieses Dialogfeld, um die Definitionen von Formatkopf und -inhalt automatisch zu initialisieren. Weitere Informationen finden Sie unter Format automatisch ausfüllen.

Formatkopf

Unter Verwendung der verfügbaren Feldcodes aus dem Verknüpfungsmenü können Sie eine Definition erstellen, die mit dem festen Anfangsteil einer Import-Datei übereinstimmt oder diesen überspringt. Die Kopfzeilendefinition wird einmal (und nur einmal) von Trimble Geomatics Office beim Starten der Datei verwendet. Stimmen die Kopfzeilen in einer Import-Datei nicht mit der Definition überein, wird das Lesen der Datei unterbrochen. Dies ist bei der Prüfung des Dateiformats nützlich.

HINWEIS: Drücken Sie die Tasten Strg+Eingabe, um Leerzeilen zur Kopfdefinition hinzuzufügen.

Eine aus Feldcodes bestehende Kopfdefinition [$Überspringen.Linie:7] bewirkt z. B., daß Trimble Geomatics Office die ersten sieben Zeilen einer Datei überspringt und den Rest der Datei interpretiert, wie im Formatinhalt definiert.

Formatinhalt

Unter Verwendung der verfügbaren Feldcodes aus dem Verknüpfungsmenü können Sie eine Definition erstellen, die mit den Daten in der zu lesenden Datei übereinstimmt. Wenn die auf ein einzelnes Element bezogenen Daten über mehrere Zeilen hinweg definiert werden, werden in der Definition am Beginn einer neuen Definitionszeile die Tasten Strg + Eingabe gedrückt.

Weitere Informationen zu den im System verfügbaren Feldern finden Sie unter Feldcodes − Überblick.

Beim Importieren einer Datei versucht Trimble Geomatics Office wiederholt die Zeilen, die in dem(n) Feldcode(s) innerhalb der Definition gelesen werden, zu interpretieren. Wenn der Inhalt der importierten Datei nicht mit der Definition übereinstimmt, wird die Nichtübereinstimmung im Import-Bericht aufgezeichnet, und das Programm versucht anschließend, weitere Daten in der Datei zu finden, die mit der Definition übereinstimmen.

HINWEIS: Trimble Geomatics Office beginnt automatisch mit der Definition des Formatinhalts in einer neuen Zeile nach der Kopfdefinition.

Formatfußzeile

Unter Verwendung der verfügbaren Feldcodes aus dem Verknüpfungsmenü können Sie eine Fußzeilendefinition erstellen, die mit dem festen Endteil einer Import-Datei übereinstimmt oder diesen überspringt.

Die Fußzeilendefinition wird nur einmal von Trimble Geomatics Office am Ende der Datei verwendet. Wenn die Fußzeilen in einer Import-Datei nicht mit der Definition übereinstimmen, wird das Lesen der Datei unterbrochen. Dies ist bei der Prüfung des Dateiformats nützlich.

HINWEIS: Drücken Sie die Tasten Strg+Eingabe, um Leerzeilen zur Fußzeilendefinition hinzuzufügen.

Trimble Geomatics Office beginnt automatisch mit der Definition der Formatfußzeile in einer neuen Zeile nach der Inhaltsdefinition.

Beispiele benutzerdefinierter ASCII-Importformate finden Sie unter Benutzerdefiniertes ASCII-Importformat − Beispiele.


Benutzerdefiniertes ASCII-Importformat - Beispiele
Benutzerdefiniertes ASCII-Importformat − Beispiele

 Siehe auch

Diese Beispiele veranschaulichen die Definition einiger ASCII-Importformate.

Beispiel 1

Um eine Datei, die die folgenden Zeilen enthält, zu lesen:

Datei Format Version 1.50

Datum: 8/11/99

Projekt: Beispiel

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,BAUM

1026,534222.218,263095.934,10.136,BAUM

1027,534224.816,263092.579,10.140,PFAHL

1028,534228.398,263089.101,10.732,ZAUN

1041,534236.948,263084.989,11.054,ZAUN

1042,534237.326,263087.964,10.982,ZAUN

1087,534243.575,263099.773,10.154,MH

könnte der Formatkopf definiert werden als:

Datei Format Version 1.50	Prüft die erste Zeile der Datei
[$Überspringen.Linie:2]	Überspringt die nächsten beiden Zeilen mit undefiniertem Inhalt

Der Formatinhalt würde definiert werden als:

[Name],[Rechtswert],[Hochwert],[Höhe],[Kartiercode]

Beispiel 2

Um eine Datei, die die folgenden Zeilen enthält, zu lesen:

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 BAUM

1026  534222.218  263095.934      10.136 BAUM

1027  534224.816  263092.579      10.140 PFAHL

1028  534228.398  263089.101      10.732 ZAUN

1041  534236.948  263084.989      11.054 ZAUN

1042  534237.326  263087.964      10.982 ZAUN

1087  534243.575  263099.773      10.154 MH

Es würde kein Formatkopf definiert werden.

Der Formatinhalt würde definiert werden als:

[Name:4][Rechtswert:12.3][Hochwert:12.3][Höhe:12.3] [Kartiercode]


Dialogfeld Format automatisch ausfüllen / Format hinzufügen

Klicken Sie auf Format automatisch ausfüllen, um die Inhaltsdefinitionen von benutzerdefinierten Import- oder Exportformaten oder Datenbank-Berichten automatisch zu initialisieren. Das Dialogfeld Format hinzufügen wird eingeblendet, wenn Sie auf die Schaltfläche klicken.

HINWEIS: Diese Schaltfläche erscheint in den folgenden Dialogfeldern:

  Datei / Importieren / Dialogfeld ASCII-Importformat definieren

  Datei / Exportieren / Dialogfeld ASCII-Exportformat definieren

  Berichte / Benutzerdefinierte Berichte / Dialogfeld Berichtsformat definieren

Trimble Geomatics Office erzeugt einen Standardsatz von Feldcodes für alle beteiligten Daten. Unter Verwendung dieser Ausgangsvoreinstellung als Grundlage für Ihr neues Format können Sie die Definition Ihren Wünschen entsprechend ändern.

Layout

Die Gruppe Layout ermöglicht Ihnen eine einfache Steuerung des Berichtsformats oder der -definition.

HINWEIS: Nachdem Sie einen Bericht erzeugt haben, können Sie diesen mit Hilfe eines HTML-Editors bearbeiten.

Feste Breite

Wählen Sie die Option Feste Breite, um jedem Feld eine feste Breite als Voreinstellung in der Definition zuzuweisen.

HINWEIS: Bei dieser Option werden in den Import- oder Export-Definitionen keine Standard-Kopfzeileninformationen erzeugt.

Mit Trennzeichen

Wählen Sie die Option Mit Trennzeichen, um die Felder einzugeben. Mit Hilfe dieser Option können Sie das Trennzeichen, das zwischen den Feldern des Berichts oder der Definition verwendet wird, festlegen.

HINWEIS: Bei dieser Option werden grundsätzlich Standard-Kopfzeileninformationen erzeugt.

Feld-Trennzeichen

Verwenden Sie das Feld Feld-Trennzeichen, um das(die) Zeichen anzugeben, das(die) zwischen den Feldern des Berichts oder der Definition eingefügt werden soll.

TIP: Das Feld enthält Voreinstellungen. Sie können jedoch jedes(alle) gewünschte(n) Zeichen in das Feld eingeben.

Textbegrenzung

Verwenden Sie das Feld Textbegrenzung, um das(die) Zeichen anzugeben, das(die) vor und nach jedem Textfeld im Bericht oder in der Definition hinzugefügt werden soll.

TIP: Das Feld enthält Voreinstellungen. Sie können jedoch jedes(alle) gewünschte(n) Zeichen in das Feld eingeben.


Exportieren - Überblick
Exportieren − Überblick

Wie kann ich ...	Dialogfeld	Siehe auch

Exportieren Sie Daten aus Ihrem Projekt, wenn Sie Daten in einem anderen Format benötigen, z. B. wenn Sie die Daten in einem anderen Softwarepaket verwenden möchten oder wenn Sie Dateien zu Trimble Survey Controller senden möchten.

Sie können Daten in einer Reihe von Dateiformaten aus einem Trimble Geomatics Office-Projekt exportieren. Sie können Daten z. B. exportieren zu:

  Trimble Survey Controller (wenn Sie Dateien zur Beendigung der Feldarbeit benötigen, z. B. Merkmals- und Attributbibliotheken)

  einer Reihe von ASCII-Formaten (wenn Sie z. B. Daten in einem anderen Format benötigen)

  einer Reihe von bekannten GIS-Formaten

  benutzerdefinierten Formaten (und zur Definition von benutzerdefinierten Formaten)

Eine Beschreibung der unterstützten Exportformate finden Sie unter Dialogfeld Exportieren.


Dialogfeld Exportieren

Verwenden Sie dieses Dialogfeld, um Daten aus Ihrem Projekt zu exportieren.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Datei / Exportieren.

  Wählen Sie auf das Symbol Exportieren [image] in der Standard-Symbolleiste.

HINWEIS: Jedes Exportformat, das ASCII-Dateien ausgibt, gibt numerische Daten grundsätzlich standardisiert aus (keine Tausender-Trennzeichen und Punkte als Dezimaltrennzeichen). Die Daten, die in eine ASCII-Datei ausgegeben werden, haben die gleichen Einheiten, die in Trimble Geomatics Office als Anzeige-Einheiten verwendet werden. Sie können jedoch im Feld Einheiten für exportierte Daten andere Exporteinheiten festlegen. Alternativ dazu können Sie die Anzeige-Einheiten in Trimble Geomatics Office mit Datei / Projekteigenschaften im Register Einheiten und Format im Dialogfeld Projekteigenschaften ändern.

Heben Sie das Exportformat hervor, um eine Beschreibung des Exportformats auf der Statusleiste anzuzeigen. Die Exportformate werden in den folgenden Registern verwaltet:

  Vermessung

  CAD / ASCII

  GIS

  Benutzerdefiniert

Neues Format

Diese Schaltfläche Neues Format wird verfügbar, wenn das Register Benutzerdefiniert markiert wird.

Klicken Sie auf Neues Format, um ein neues benutzerdefiniertes Format zu erzeugen. Verwenden Sie dann das Dialogfeld ASCII-Exportformat definieren zur Definition des Exportformats.

Format bearbeiten

Diese Schaltfläche Format bearbeiten wird verfügbar, wenn das Register Benutzerdefiniert markiert wird.

Klicken Sie auf Format bearbeiten, um bestehende ASCII-Exportformate zu ändern. Verwenden Sie dann das Dialogfeld ASCII-Exportformat definieren zur Bearbeitung des Exportformats. Weitere Informationen über die Definition eines benutzerdefinierten Formats finden Sie in den Beispielen unter dem Thema ASCII-Exportformat definieren − Beispiele.

Format löschen

Diese Schaltfläche Format löschen wird verfügbar, wenn das Register Benutzerdefiniert markiert wird.

Klicken Sie auf Format löschen, um ein benutzerdefiniertes Exportformat zu löschen. Bestätigen Sie dann den Löschvorgang, oder brechen Sie den Vorgang ab.

Benutzerdefiniert

Verwenden Sie die Schaltfläche Benutzerdefiniert (Customize), um die Liste mit den Exportoptionen im Dialogfeld Exportieren auszuwählen. Wählen Sie die benötigen Exportoptionen aus der Liste mit den Kontrollkästchen.

Sie können im Dialogfeld Vermessung Externe Exportfilter einen externen Filter hinzufügen. Externe Filter sind separate Programme, die Sie erstellen und in Trimble Geomatics Office integrieren können. Jeder externe Filter, der für die Verwendung in Trimble Geomatics Office geschrieben wird, muß bestimmte Voraussetzungen erfüllen, damit er zum System hinzugefügt werden kann. Es werden nur die gerade installierten Filter im gewählten Register des Dialogfelds Exportieren angezeigt.

Jedes Filter-Programm muß als Dynamically Linked Library (*.dll) mit bestimmten exportierten Funktionen kompiliert und als COM (Component Object Module)-Objekt erstellt werden.

Wenn Sie die geeignete Datei wählen, registriert Trimble Geomatics Office das COM-Filterobjekt im Computer und prüft, ob das .dll-Interface den Systemanforderungen entspricht. Ist dies nicht der Fall, informiert Sie das System, daß der Filter nicht registriert werden kann. Wenn der Filter erfolgreich installiert wurde, erscheint eine kurze Beschreibung des Filters im Dialogfeld.

Weitere Informationen finden Sie unter External Import/Export filters.

Optionen

Klicken Sie für die exportierte Datei auf Optionen, um:

  die Einheiten für exportierte Daten festzulegen.

  die Einstellungen in der exportierten Datei festzulegen.

  das Koordinatensystem der zu exportierenden Daten zu ändern.

  die Optionen für die Datenübertragung zu einem Gerät, einem 3300/3600/5600 Elta M5 oder einem  3600/5600 GDM festzulegen.

Diese Schaltfläche ist nicht verfügbar, wenn ein Exportformat nicht konfiguriert werden kann.

Klicken Sie auf Optionen, um die Konfigurationsdetails für die angegebene zu exportierende Datei festzulegen. Zum Beispiel können Sie beim Format AutoCAD (*.dxf oder *.dwg) als Optionen für den AutoCAD-Export das Datenformat (.dwg, Ascii .dxf, Binäre .dxf), die AutoCAD-Versionsnummer und die Prototyp-Zeichnung auswählen.

Koordinatensystem für exportierte Daten

Klicken Sie im Dialogfeld Optionen auf Ändern, um das Koordinatensystem für die zu exportierende Datei auszuwählen. Die Schaltfläche wird verfügbar, wenn die Datei keine Koordinatensystemdefinition für das gerade hervorgehobene Format enthält. Wenn Sie ein Koordinatensystem wählen, das sich vom Projekt-Koordinatensystem unterscheidet, konvertiert Trimble Geomatics Office die Koordinaten der zu exportierenden Punkte in das gewählte Koordinatensystem, schreibt die Exportdatei und speichert die Punkte im gewählten Koordinatensystem.

HINWEIS: Die Koordinatenwerte für Punkte, die in Trimble Geomatics Office dargestellt werden, können sich von denen, die in die Datei geschrieben werden, unterscheiden.

Exportieren

Wenn eine aktuelle Auswahl unter Verwendung der Auswahl-Symbole erfolgt, können Sie zwischen dem Exportieren ausgewählter Daten oder der ganzen Datenbank wählen.

Die beiden verfügbaren Optionen sind:

Auswahl	Exportiert ausgewählte Punkte
Ganze Datenbank	Exportiert alle Punkte der Datenbank
Ohne aktuelle Auswahl stehen die Auswahl-Schaltflächen nicht zur Verfügung, und der Exportvorgang wird auf die ganze Datenbank angewendet.

Daten sortieren

Sie können die Reihenfolge festlegen, in der die Daten exportiert werden:

1.	Wählen Sie das Kontrollkästchen Daten sortieren.

2.	Wählen Sie eine Sortierreihenfolge aus der Liste. Folgende Optionen stehen zur Verfügung:

Datenbankreihenfolge	Höhe
Name	Qualität
Startzeit	Datentyp
Länge der Besetzung

HINWEIS: Diese Sortieroptionen stehen ebenfalls im Eigenschaftsfenster zur Verfügung.

TIP: Wenn Sie Ihre eigenen Sortierabfragen hinzufügen, werden diese zur Liste hinzugefügt. Weitere Informationen finden Sie unter Datenbankabfragen – Überblick.


Exportformate - Register Vermessung
Exportformate − Register Vermessung

 Überblick und weitere Informationen

Verwenden Sie das Register Vermessung im Dialogfeld Exportieren, um Vermessungsdaten zu einer Datei oder einem Gerät zu exportieren.

So greifen Sie auf dieses Register zu:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

Sie können benutzerdefinierte Formate in dieses Register verschieben. Weitere Informationen finden Sie unter Asciiexp.dat-Datei.

Dieses Register enthält die folgenden Formate:

Option	Verwenden Sie diese Option, um folgendes zu exportieren …
Antennendetails zu Survey Controller	Neue Antennendetails zu Trimble Survey Controller. Verwenden Sie dieses Exportformat z. B. wenn Trimble eine neue Antenne auf den Markt bringt, um die Antennendetails zu Trimble Survey Controller zu exportieren.
Hintergrundkarte zu Trimble Survey Controller (*.dxf)	Eine .dxf-Datei zu Trimble Survey Controller (Version 10 oder höher).
Koordinaten-Datei mit Kommas als Trennzeichen zum Trimble Survey Controller (*.csv)	Eine csv-Datei zu Trimble Survey Controller (Version 10 oder höher).
Attribut-Verzeichnis zu Survey Controller (*.ddf)	Eine Attribut-Verzeichnisdatei (.ddf) zu einem Gerät mit Trimble Survey Controller. Dazu muß ein Survey Controller-Gerät eingerichtet sein.  Sie können eine .ddf-Datei im Data Dictionary Editor-Programm erzeugen. Dieses Programm ist Teil von Trimbles GPS Pathfinder Software. HINWEIS: Sie können eine .ddf-Datei nur zu Trimble Survey Controller (Version 7.00 übertragen).
Datum-Gitternetz zu Survey Controller (*.cdg)	Das Datum-Gitternetz zu Trimble Survey Controller (Version 7.00 oder höher). Sie können die Größe der zu übertragenden Datum-Gitternetz-Datei durch Untergittern reduzieren. Ältere Trimble Survey Controller-Versionen unterstützen keine Datum-Gitter. Dazu muß ein Survey Controller-Gerät eingerichtet sein. HINWEIS: Sie können nur die Datum-Gitternetz-Datei untergittern, die im aktuellen Projektkoordinatensystem verwendet wird, aber Sie können eine beliebige kombinierte Datum-Gitternetz-Datei exportieren.
Beschreibungsdatei zu TDS-Gerät (*.txt)	Eine Beschreibungsdatei (*.txt) zu einem Gerät, auf dem die TDS-Software ausgeführt wird. Dazu muß zuerst ein TDS-Gerät eingerichtet werden. Sie können eine Beschreibungsdatei manuell erstellen oder aus dem Feature Code Editor-Programm exportieren.
DGM-Punkte zu Datei (*.dtx)	Eine mit Trimble Survey Controller kompatible Digitale Geländemodell-Datei (*.dtx), die ausgewählte Projektpunkte enthält.
DGM-Punkte zu Survey Controller	Eine mit Trimble Survey Controller kompatible Digitale Geländemodell-Datei (*.dtx), die ausgewählte Punkte enthält, die direkt in die Trimble Survey Controller-Software exportiert werden sollen. Dazu muß ein Survey Controller-Gerät eingerichtet sein.
Merkmals- und Attributbibliothek zu SDR33-Datei (*.sdr)	Eine SDR33-Datei mit Notiz-Datensätzen für jeden Kartiercode in der von Ihnen gewählten Bibliothek. Sie können mit dieser Option keine Attribute exportieren.
Merkmals- und Attributbibliothek direkt zu Survey Controller (*.fcl)	Eine Merkmals- und Attributbibliothek zu einem Gerät, auf dem Trimble Survey Controller ausgeführt wird. Die Datei kann Attribute enthalten, dies ist jedoch optional. (Wenn Attribute exportiert werden sollen, wählen Sie das entsprechende Kontrollkästchen). Dazu muß ein Survey Controller-Gerät eingerichtet sein.  Es werden keine zusätzlichen Informationen (z. B. Punktstile) aus der Merkmals- und Attributbibliothek zum Trimble Survey Controller übertragen.
Merkmals- und Attributbibliothek zu TDS-Gerät (*.fcl)	Eine Beschreibungsdatei (*.txt) basierend auf der gewählten Merkmals- und Attributbibliothek zu einem Gerät, auf dem die TDS-Software ausgeführt wird. Dazu muß zuerst ein TDS-Gerät eingerichtet werden. Es werden keine Attribute zur TDS-Software exportiert.
Geoid-Datei zu Survey Controller (*.ggf)	Eine Geoid-Gitternetz-Datei zu einem Gerät, auf dem Trimble Survey Controller ausgeführt wird (Version 6 oder höher). Sie können den Arbeitsbereich wählen und somit die Größe der zu übertragenden Datei reduzieren (Untergitter). Dazu muß ein Survey Controller-Gerät eingerichtet sein.  HINWEIS: Sie müssen zur Untergitterung ein Koordinatensystem mit einem definierten Geoid-Modell verwenden. Sie können nur die gerade verwendete Geoid-Gitternetz-Datei untergittern, aber Sie können eine beliebige Geoid-Datei exportieren.
Geoid-Datei zu TDS Survey Pro (CE)	Eine Geoid-Gitternetz-Datei zu einem Gerät, auf dem die TDS Survey Pro (CE)-Software ausgeführt wird.  Sie können den Arbeitsbereich wählen und somit die Größe der zu übertragenden Geoid-Gitternetz-Datei reduzieren (Untergitter).
NGS Bluebook-Dateien	B, G und SERFIL-Dateien. Das NGS Bluebook-Format wird vor allem zur Übertragung von GPS-Basislinien zum US National Geodetic Survey verwendet, die in das nationale Festpunktnetz aufgenommen werden sollen.
Pcode-Datei zu 3600/5600 GDM (*pco)	Eine Pcode-Datei zu einem 3600/5600 GDM.
Trimble Datenaustauschformat	Vermessungsdaten aus Ihrem Trimble Geomatics Office-Projekt. Verwenden Sie dieses Format, um Vermessungsdaten zwischen Trimble Geomatics Office-Projekten zu kopieren. Dieses Format wird auch zum Export von Daten in Netzausgleichungssoftwarepakete anderer Hersteller verwendet. Das Format wurde von Trimble definiert. Es wird verwendet, um ASCII-Dateien mit Standpunkten, Koordinaten, verarbeiteten GPS-Basislinien terrestrischen Beobachtungen, Laser-Beobachtungen, Nivellier- und Azimut-Daten zu erzeugen. Setzen Sie sich mit dem Hersteller Ihrer Netzausgleichungssoftware in Verbindung, um herauszufinden, ob dieses Format unterstützt wird.
SDR-Dateien (*.sdr)	Eine .sdr-Datei unter Verwendung des aktuellen Projekts in der konfigurierten Version.  Klicken Sie auf Optionen, um die Konfiguration zu ändern.
STAR*NET 2D-  Festpunkte	Festpunkte im STAR*NET 2D-Format. Es werden nur Datenbank-Punkte exportiert, deren Hochwert/Rechtswert Vermessungsqualität haben. Die Höhe kann eine beliebige Qualität haben.  Wenn Sie mit dem STAR*NET-Paket arbeiten, ist es von Vorteil, die Festpunkte und Beobachtungsdateien in einer einzigen Datei mit einem entsprechenden Text-Editor zu kombinieren.
STAR*NET 3D- Festpunkte	Festpunkte im STAR*NET 3D-Format. Es werden nur Datenbank-Punkte exportiert, deren Hochwert/Rechtswert/orthom. Höhe Vermessungsqualität haben.  Wenn Sie mit dem STAR*NET-Paket arbeiten, ist es von Vorteil, die Festpunkte und Beobachtungsdateien in einer einzigen Datei mit einem entsprechenden Text-Editor zu kombinieren.
STAR*NET- Beobachtungen	Alle konventionellen Beobachtungen in der Projekt-Datenbank im STAR*NET-Beobachtungsformat. Wenn Sie mit dem STAR*NET-Paket arbeiten, ist es von Vorteil, die Festpunkte und Beobachtungsdateien in einer einzigen Datei mit einem entsprechenden Text-Editor zu kombinieren.
Vermessungsgeräte	Daten direkt zu unterstützten Totalstationen, Geräten, Survey Data Cards und GPS-Empfängern.
Survey Controller-Dateien (*.dc)	Eine .dc-Datei unter Verwendung des aktuellen Projekts in der konfigurierten Version.  Klicken Sie auf Optionen, um die Konfiguration zu ändern.
Trimble 3300 / 3600 /5600 Elta M5-Dateien	Eine Trimble 3300 / 3600 /5600 Elta M5-Datei
Trimble 3600/5600 GDM-Dateien (*.are)	Eine Trimble 3600/5600 GDM-Area-Datei
Trimble Elta GPS Controller M5-Dateien (*.dat)	Eine Trimble Elta GPS Controller M5-Koordinatendatei
TDS Survey Pro (CE)-Projektdatei (*.job)	Eine Projektdatei zu einem TDS Survey Pro CE-Gerät.
Trimble 3600/5600 TDS-Koordinatendateien (*.cr5)	Eine Koordinatendatei zu einem Trimble 3600/5600 TDS-Gerät.
Trimble Datenaustauschformat (*.asc)	Eine TDEF-Datei


CAD / ASCII-Exportformate

 Überblick und weitere Informationen

Verwenden Sie das Register CAD / ASCII, um Daten in eine Reihe von ASCII- und CAD-Formaten zu exportieren.

So greifen Sie auf Exportieren / Register CAD / ASCII zu:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register CAD / ASCII.

Sie können benutzerdefinierte Formate in dieses Register verschieben. Weitere Informationen finden Sie unter Asciiexp.dat-Datei.

HINWEIS: Jedes Exportformat, das ASCII-Dateien ausgibt, gibt numerische Daten grundsätzlich standardisiert aus (keine Tausender-Trennzeichen und Punkte als Dezimaltrennzeichen). Die Werte, die an eine ASCII-Datei ausgegeben werden, haben die gleichen Einheiten, die gegenwärtig zur Darstellung im System verwendet werden, bis Sie die Einheiten unter Verwendung der Liste der Einheiten für exportierte Daten ändern. Verwenden Sie das Dialogfeld Projekteigenschaften, um die Anzeige-Einheiten des Systems zu ändern. Wählen Sie das Register Einheiten und Format, um darauf zuzugreifen.

Dieses Register enthält die folgenden Optionen:

Option	Verwenden Sie diese Option um folgendes zu exportieren ...
AutoCAD-Dateien (*.dxf, *.dwg)	eine AutoCAD Drawing Exchange oder eine Drawing-Datei. Klicken Sie auf Optionen, um das Datenformat, die Version und die Prototyp-Zeichnung zu konfigurieren.
C&G Standardformat	eine Standard C & G Software ASCII-Datei.
C&G ohne Anführungszeichen	eine C & G Software ASCII-Datei ohne Anführungszeichen.
CMM-Dateien (*.cor, *.lev)	die Standard ASCII-Formatdateien, die vom  Bureaux of Land Management verwendet werden. Die Option CMM-Dateien (*.cor, *.lev) wird unter Verwendung eines externen Exportfilters bereitgestellt.
DC-Datei mit Attributnotizen (Survey Controller V4)	eine .dc-Datei der Trimble Survey Controller-Version 4, die Attribute enthält, deren Werte durch Doppelpunkte (:) getrennt sind. Attribute, die mit einer Merkmals- und Attributbibliohek aufgezeichnet wurden, werden nicht in dieses Format exportiert.
Pacsoft-Format	eine Datei im Pacsoft ASCII-Format.
SDMS-Format	Daten im AASHTO Survey Data Management System-Format.
SDRmap-Koordinaten	eine SDRmap-Koordinatendatei.
Autodesk Feldbuch-Datei (*.fbk)	eine Datei im Autodesk ‘Fieldbook’-Format.
TERRAMODEL – P,N,E,Z,20D – Datei (*.pts)	eine einfache Datei mit Kommas als Trennzeichen.
TPLANE (LLHE)	eine Datei im Trimble GPSurvey ASCII-Format. Die WGS-84-Breiten- und -Längenkoordinaten werden mit dieser Option exportiert.
TRIMMAP-Graphikdatei (*.tgf)	eine TRIMMAP (oder SDRmap)-Graphikdatei.
WILDsoft-Format	eine Standard WILDsoft Software ASCII-Datei.


Exportformate - Register Benutzerdefiniert
Exportformate − Register Benutzerdefiniert

So greifen Sie auf Exportieren / Register Benutzerdefiniert zu:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Benutzerdefiniert.

Sie können benutzerdefinierte Formate in dieses Register verschieben. Weitere Informationen finden Sie unter Asciiexp.dat-Datei.

Verwenden Sie das Register Benutzerdefiniert, um:

  Dateien in einem benutzerdefinierten Format zu exportieren

  neue benutzerdefinierte Exportformate hinzufügen

  bestehende benutzerdefinierte Exportformate zu bearbeiten

 benutzerdefinierte Exportformate zu löschen.

Die folgenden benutzerdefinierten Formate werden unterstützt:

  Punkte mit Trennzeichen

  Punkte mit fester Breite

  Name,Rechtsw,Hochw,Höhe,Code

  Name,Breite,Länge,EllH (Örtliche Dezimalgrad)

  Name,Breite,Länge,EllH (WGS-84 Dezimalgrad)

  Name,Breite,Länge,EllH,Code (Örtlich)

  Name,Breite,Länge,EllH,Code (WGS-84)

  Name,Hochw,Rechtsw,Höhe,Br,Lä,EllH,Code (Örtlich)

  Name,Hochw,Rechtsw,Höhe,Br,Lä,EllH,Code (WGS-84)

  Name,Rechtsw,Hochw,Höhe,Code

  Punkt auf Trasse

  Sollpunkte – wie abgesteckt

  Trasse – Geländeschnittpunkt

  Trasse – Reißbrett

Die benutzerdefinierten Formate erscheinen in alphabetischer Reihenfolge.

HINWEIS: Die in eine ASCII-Datei exportierten Werte werden immer in standardisierter Form geschrieben, d. h. ohne Zifferngruppierungssymbol (Tausender-Trennzeichen) sowie mit einem Punkt als Dezimaltrennzeichen. Die Optionen in Microsoft Windows Systemsteuerung / Ländereinstellungen / Zahlen werden nicht verwendet.

Alle benutzerdefinierten Exportformate werden in die Asciiexp.dat-Datei geschrieben.


Dialogfeld Optionen Merkmals- und Attributbibliothek

Verwenden Sie dieses Dialogfeld, um die Trimble Survey Controller-Version, zu der Sie exportieren möchten, zu konfigurieren.

Version

Wenn Sie eine ältere Version als Version 7.00 wählen, steht das Kontrollkästchen Attribute exportieren im Dialogfeld Merkmals- und Attributbibliothek wählen nicht zur Verfügung, da frühere Versionen keine Attribute unterstützen.


Dialogfeld Optionen für AutoCAD-Export

Verwenden Sie dieses Dialogfeld, um die AutoCAD-Version, zu der Sie exportieren möchten, zu konfigurieren.

Datenformat

Wählen Sie das Format der Datenausgabe unter den verfügbaren Möglichkeiten aus:

  DWG (eine binäre AutoCAD Drawing-Datei)

  ASCII DXF (eine Standard-AutoCAD Data eXchange-Datei)

  Binäre DXF (eine Standard-AutoCAD Data eXchange-Datei in binärem Format)

HINWEIS: Das Datenformat wird durch Ihre Bedürfnisse (bzw. die Ihres Kunden) bestimmt.

Version

Wählen Sie die entsprechende AutoCAD-Version für die Export-Datei aus. Diese wird von dem System, in das Sie exportieren, bestimmt.

Prototyp-Zeichnung

Verwenden Sie dieses Feld, um auf eine AutoCAD-Prototyp-Zeichnung zu verweisen, von der Sie Datenblockdefinitionen zur Verwendung in systemerzeugten *.dxf- und *.dwg-Dateien übernehmen möchten.

Wird eine AutoCAD-Datei von Trimble Geomatics Office erzeugt, versucht die Software, Übereinstimmungen zwischen den Namen der im Projekt verwendeten Symbole und den in der festgelegten Prototyp-Zeichnung definierten Datenblöcken zu finden. Jedes Leerzeichen innerhalb der Symbolnamen stimmt mit Unterstrichen in den AutoCAD-Datenblocknamen überein.

Stimmt ein Symbolname mit einem Datenblocknamen in der Prototyp-Zeichnung überein, wird der entsprechende Datenblock mit der erforderlichen Skalierung und Rotation in die Exportdatei eingefügt. Jedes Symbol, das nicht mit einem Datenblock in der Prototyp-Zeichnung in Einklang gebracht werden kann, wird als Punkt eingefügt. Eine angegebene Prototyp-Zeichnung (SYMBOLS.DXF) enthält Datenblockdefinitionen für alle vom System bereitgestellten Standardsymbole.

HINWEIS: Die Datenblockdefinitionen in der Prototyp-Zeichnung werden als 200 mal 200 Einheiten interpretiert, wobei die Einheiten die Anzeige-Einheiten zum Zeitpunkt des Exportierens sind. Die 200 mal 200-Definition muß mit dem Gitter übereinstimmen, das vom Trimble Symbol und LineType Editor Programm verwendet wird. Wenn Sie Ihre eigene Prototyp-Zeichnung mit Datenblockdefinitionen erzeugen möchten, müssen Sie sicherstellen, daß die Datenblöcke auf einer 200 mal 200-Definition basieren, um die richtige Skalierung der Symbole zu erzielen.

Durchsuchen

Klicken Sie auf Durchsuchen, um das System zu durchsuchen und die benötigten AutoCAD-Dateien zu finden.


Dialogfeld ASCII-Exportformat definieren

Verwenden Sie dieses Dialogfeld, um ASCII-Exportformate zu definieren.

Name

Geben Sie den Namen des Exportformats ein. Dieser Name erscheint in der Typenliste des Registers Benutzerdefiniert im Dialogfeld Exportieren. Doppelte Namen sind nicht erlaubt.

Null-String

Geben Sie den Null-String für die Definition des Exportformats ein. Dieses Feld ist optional. Jedes Mal, wenn ein Datenbank-Feld auftritt, dem kein Wert zugewiesen ist, gibt Trimble Geomatics Office den im Dateiformat angegebenen Null-String aus.

HINWEIS: Für einige Dateitypen kann eine bestimmte Zeichenfolge erforderlich sein, wie z. B. "99999.99", "*****" oder eine ähnliche Zeichenfolge. Sie können Trimble Geomatics Office anweisen, Ihre Vorgabe zu verwenden, indem Sie die Einstellungen festlegen.

Beschreibung

Geben Sie eine Beschreibung des Exportformats ein. Diese Beschreibung erscheint in der Statusleiste.  Dieses Feld ist optional.

Standard-Erweiterung

Geben Sie die Dateierweiterung für das Exportformat ein, z. B. dat oder fbk. Dieses Feld ist optional. Falls nichts in dieses Feld eingegeben wird, wird die Erweiterung "*.txt" vorausgesetzt.

HINWEIS: Trimble Geomatics Office gibt die Erweiterung im Feld Dateityp des Dialogfelds Speichern unter ein. Der Name der neuen Datei kann in das Feld Dateiname eingegeben werden. Es werden alle Dateien mit der entsprechenden Erweiterung im ausgewählten Ordner dargestellt, so daß Sie, falls erforderlich, überschrieben werden können. Trimble Geomatics Office setzt automatisch den Punkt bei einer Erweiterung voraus.

Exportieren von

Wählen Sie die primären Tabellen oder Abfragen als Quelle für die Export-Datei(en) aus. Die voreingestellte Quelle ist Punktinformation. Sie können so jeden Datensatz aus der Punktetabelle exportieren.

Format automatisch ausfüllen

Klicken Sie auf Format automatisch ausfüllen, um das Ausfüllen des Formatkopfs und -inhalts automatisch zu initialisieren. Weitere Informationen finden Sie unter Format automatisch ausfüllen.

Formatkopf

Geben Sie (über das Verknüpfungsmenü) den Text, die Feldcode-Definitionen oder beides ein, die Trimble Geomatics Office zur Erzeugung des festen Anfangsteils der Export-Datei verwenden soll. Dieses Feld ist optional.

Eine vollständige Liste der Details über die im System verfügbaren Feldcodes finden Sie unter Feldcodes − Überblick.

Durch Drücken der Eingabetaste können Leerzeilen zur Kopfdefinition hinzugefügt werden.

Formatinhalt

Geben Sie die entsprechende Feldcode-Definition (über das Verknüpfungsmenü) ein, um anzuzeigen, welche Daten Trimble Geomatics Office aus der Datenbank exportieren soll. In dieses Feld muß eine Ausgabe-Definition eingegeben werden. Wenn die Daten für ein einzelnes Element über mehrere Zeilen exportiert werden, verwenden Sie diese Definition. Drücken Sie hierzu die Eingabetaste, um eine neue Definitionszeile hinzuzufügen.

HINWEIS: Weitere Informationen über alle im System verfügbaren Feldcodes finden Sie unter Feldcodes − Überblick.

Formatfußzeile

Geben Sie (über das Verknüpfungsmenü) den Text, die Feldcode-Definitionen oder beides ein, die Trimble Geomatics Office zur Erzeugung des festen Endteils der Export-Datei verwenden soll. Dieses Feld ist optional.

Eine vollständige Liste mit Details über die im System verfügbaren Feldcodes finden Sie unter Feldcodes − Überblick.

Durch Drücken der Eingabetaste können Leerzeilen zur Fußzeilendefinition hinzugefügt werden.

Beispiele für benutzerdefinierte ASCII-Exportformate finden Sie unter ASCII-Exportformat definieren − Beispiele.


ASCII-Exportformat definieren - Beispiele
ASCII-Exportformat definieren − Beispiele

 Siehe auch

Die folgenden Beispiele veranschaulichen die Erzeugung einiger ASCII-Exportformate, wenn das Projekt die folgenden Punkte enthält:

Name: 1000	Rechtsw: 534247.541	Hochw: 263104.807	Höhe: 10.118	Code: STN

Name: 1024	Rechtsw: 534220.249	Hochw: 263104.249	Höhe: 10.129	Code: MH

Name: 1025	Rechtsw: 534222.850	Hochw: 263100.894	Höhe: 10.133	Code: BAUM

Name: 1026	Rechtsw: 534222.218	Hochw: 263095.934	Höhe: 10.136	Code: BAUM

Name: 1027	Rechtsw: 534224.816	Hochw: 263092.579	Höhe: 10.140	Code: POLE

Name: 1028	Rechtsw: 534228.398	Hochw: 263089.101	Höhe: 10.732	Code: ZAUN

Name: 1041	Rechtsw: 534236.948	Hochw: 263084.989	Höhe: 11.054	Code: ZAUN

Name: 1042	Rechtsw: 534237.326	Hochw: 263087.964	Höhe: 10.982	Code: ZAUN

Name: 1087	Rechtsw: 534243.575	Hochw: 263099.773	Höhe: 10.154	Code: MH

Beispiel 1

Das Exportformat:

Formatkopf:

Datei Format Version 1.50

Datum: [$System.Datum]

Projekt: [$Projekt.Name]

Formatinhalt:

[Name],[Rechtswert:0.3],[Hochwert:0.3],[Höhe:0.3],[Kartiercode]

Formatfußzeile:

[$System.Über]

Dieser Formatinhalt erzeugt die folgende Export-Datei (unter Verwendung des entsprechenden Datums, der Microsoft Windows Datumsformat-Einstellungen und des Projektnamens):

Datei Format Version 1.50

Datum: 8/11/96

Projekt: Beispiel

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,BAUM

1026,534222.218,263095.934,10.136,BAUM

1027,534224.816,263092.579,10.140,PFAHL

1028,534228.398,263089.101,10.732,ZAUN

1041,534236.948,263084.989,11.054,ZAUN

1042,534237.326,263087.964,10.982,ZAUN

1087,534243.575,263099.773,10.154,MH

Trimble Geomatics Office, Version 1.50

Beispiel 2

Das Exportformat:

Kein Formatkopf:

Formatinhalt:

[Name:4][Rechtswert:12.3][Hochwert:12.3][Höhe:12.3] [Kartiercode]

Dieser Formatinhalt erzeugt die folgende Export-Datei:

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 BAUM

1026  534222.218  263095.934      10.136 BAUM

1027  534224.816  263092.579      10.140 PFAHL

1028  534228.398  263089.101      10.732 ZAUN

1041  534236.948  263084.989      11.054 ZAUN

1042  534237.326  263087.964      10.982 ZAUN

1087  534243.575  263099.773      10.154 MH

HINWEIS: Trimble Geomatics Office nimmt an, daß am Ende des Formatkopfs und -inhalts ein Zeilenvorschub eingefügt wird. Drücken Sie die Eingabetaste, um (eine) zusätzliche Zeile(n) hinzuzufügen. Die Cursorposition wird um eine Zeile nach unten verschoben, kehrt zum linken Rand zurück und erzeugt eine Leerzeile, in die Sie den neuen Text eingeben.


Option SDMS-Format

Das von der American Association of State Highway and Transportation Officials (AASHTO) definierte Survey Data Management System (SDMS) besteht aus einem speziellen Format für Vermessungsdaten. Sie können Daten von Trimble Geomatics Office in diesem Format exportieren.

Diese Option exportiert Punkte und die dazugehörigen Attributnotizen. Diese Notizen können zusätzliche Punktmerkmale enthalten. Diese Attributnotizen werden bei einer Vermessung in das Gerät, auf dem Trimble Survey Controller ausgeführt wird, eingegeben. Die spezielle Attributnotizen-Funktion des Trimble Survey Controllers ist hierbei behilflich. Darüber hinaus werden alle Notizdatensätze, die mit einer aus zwei Zeichen bestehenden Kennung gefolgt von einem Doppelpunkt (:) oder einem Leerzeichen und den Attributdetails eingegeben werden, in eine SDMS-Datei exportiert.

So wird z. B. eine Notiz, die I0:Information oder I0 Information enthält, als I0:Information in eine SDMS-Datei exportiert, wobei ‘Information‘ der mit der SDMS-Kennung I0 verbundene Text ist.

Um die Attributnotizen mit den korrekten Punkten in der erzeugten SDMS-Datei zu verbinden, müssen Sie beim Exportieren die Auswahlmenge wählen, die automatisch erzeugt wurde, als die Trimble Survey Controller *.dc-Datei in das Projekt importiert wurde. Diese Auswahlmenge behält alle Daten (einschließlich aufgezeichneter Notizen) in der Vermessungsreihenfolge bei, die in der .dc-Datei vorgefunden wird.


Externe Filter - Überblick
Externe Filter − Überblick

Mit Trimble Geomatics Office haben Sie die Möglichkeit, externe Import- und Exportfilter hinzuzufügen. Sie können diese Filter unabhängig vom Hauptsystemprogramm als Dynamically Linked Libraries (.dll) mit bestimmten exportierten Funktionen schreiben. Die .dll-Dateien müssen als Object Linking and Embedding- (OLE) Module erzeugt werden. Sie werden auch als Component Object Module- (COM) Objekte bezeichnet.

Die folgenden exportierten Funktionen müssen in einem externen Filter zur Verfügung stehen:

GetGUID Function

Pascal Funktionsangabe:	function GetGUID: TGUID; stdcall; export;

C/C++ Funktionsangabe:	GUID __stdcall __export GetGUID()

Diese Funktion muß die eindeutige Kennung der Komponentenklasse OLE (GUID - Globally Unique IDentifier) ausgeben, die dem Programm zugewiesen worden ist. Sie erhalten diese eindeutige Kennung mit Hilfe eines entsprechenden Programms, das eine eindeutige Kennung im allgemeinen basierend auf Informationen wie Zeit und Datum des Computers, Kennung der Netzwerkkarte oder ähnliches erzeugt. Der Grundgedanke ist, daß die ID weltweit eindeutig sein soll. Dies wird hoffentlich durch die Verwendung von ausreichend langen Zahlen (mit 32 Stellen) erreicht, so daß das Auftreten von zwei Zufallszahlen mit gleichem Wert statistisch unmöglich ist. Ein Beispiel für eine GUID ist 07F750A3-594B-11D1-8E4C-0000C04FCAF9.

Convert-Function

Pascal Funktionsangabe:	function Convert(const FileName: WideString): WordBool;

C/C++ Funktionsangabe:	BOOL __stdcall __export Convert(BSTR FileName)

Hierbei handelt es sich um die Funktion, die die eigentliche Arbeit des Filters ausführt. Das Filterprogramm muß in der Lage sein, Daten von einer Quelldatei zu den in einer Zieldatei gespeicherten Daten im passenden Format zu konvertieren. Mit Hilfe dieser Funktion kann Trimble Geomatics Office den Zieldateinamen für die Datei bestimmen, die vom Filter erzeugt wird. Bei einem Importfilter setzt Trimble Geomatics Office voraus, daß der Filter ein Standarddialogfeld Datei / Öffnen anzeigt, in dem die Quelldatei ausgewählt werden kann. Der Zieldateiname, der vom System für das zu erzeugende Filterprogramm definiert wird, wird durch die Convert-Funktion an den Filter weitergegeben. Die vom Importfilterprogramm erzeugte Datei muß ein gültiges .dc-Dateiformat (Survey Controller- oder SDR-Dateiformat) besitzen.

Bei einem Exportfilter setzt Trimble Geomatics Office voraus, daß der Filter ein Standarddialogfeld Datei / Speichern anzeigt, in dem die Zieldatei ausgewählt werden kann. Trimble Geomatics Office erzeugt die Quelldatei für den Filter entsprechend des Dateiformats, das in der nachstehend beschriebenen Format-Funktion definiert wird. Der Name der Quelldatei wird an die Convert-Funktion weitergegeben, damit der Filter weiß, mit welcher Datei er arbeiten muß. Trimble Geomatics Office entnimmt der Datenbank die Daten entsprechend der Auswahlmengenkriterien, die für den Exportvorgang definiert werden. Die in der Format-Funktion festgelegte Feldcode-Definition kontrolliert das Format der Daten, die von Trimble Geomatics Office in die Quelldatei geschrieben werden. Das Exportfilterprogramm muß die Quelldatei lesen, die Daten in das passende Exportformat konvertieren und sie anschließend in die angegebene Zieldatei übertragen.

GetLongDesc Function

Pascal Funktionsangabe:	function GetLongDesc: WideString; safecall;

C/C++ Funktionsangabe:	BSTR __stdcall __export GetLongDesc()

Diese Funktion wird verwendet, um den Text zur Verfügung zu stellen, der in der Trimble Geomatics Office-Statusleiste dargestellt wird, wenn die Import- oder Exportfilteroption im Dialogfeld Importieren oder Exportieren hervorgehoben ist. Die Definition dieser Funktion ist optional. Bleibt sie undefiniert, erscheint keine Anzeige in der Statusleiste, wenn eine Filteroption gewählt wird.

GetShortDesc Function

Pascal Funktionsangabe:	function GetShortDesc: WideString; safecall;

C/C++ Funktionsangabe:	BSTR __stdcall __export GetShortDesc()

Mit Hilfe dieser Funktion wird der Text für den Namen des Import- oder Exportfilters zur Verfügung gestellt, der im Dialogfeld Importieren oder Exportieren in Trimble Geomatics Office angezeigt wird, um die Auswahl der Filter zu ermöglichen.

Format Function

Pascal Funktionsangabe:	function Format: WideString; safecall;

C/C++ Funktionsangabe:	BSTR __stdcall __export Format()

Diese Funktion ist nur in Exportfilterprogrammen erforderlich und ermöglicht dem Programm, das Format der Quelldatei zu bestimmen, die von Trimble Geomatics Office erzeugt wird. Die durch diese Funktion ausgegebene Textzeichenfolge muß aus gültigen Trimble Geomatics Office-Feldcodes bestehen. Wenn in einem Exportfilterprogramm keine Format-Funktion definiert wird, setzt Trimble Geomatics Office das Format '[Name],[Hochwert],[Rechtswert],[Höhe],[Kartiercode]' voraus, so daß eine Datei mit durch Kommas getrennten Namens-, Hoch-,. Rechts-, Höhen- und Kartiercode-Werten erzeugt wird, die vom Exportfilter gelesen wird.


Option GPS-Dateien (*.dat)

Eine .dat-Datei enthält GPS-Rohdaten von einem GPS-Empfänger. Diese Dateien können nachverarbeitete kinematische Daten und statische Daten beinhalten. GPS-Dateien (.dat) enthalten keine Koordinatensysteminformationen.

Sie können eine .dat-Datei zu einem Trimble Geomatics Office-Projekt übertragen von:

  einem Trimble Survey Controller (mit .dc-Datei)

  einem Trimble Vermessungs-GPS-Empfänger

  einem Computer

HINWEIS: Wenn Sie eine .dat-Datei mehr als einmal in das gleiche Projekt importieren, werden gemäß Voreinstellung keine bestehende Besetzungen in der Projektdatenbank im Dialogfeld DAT-Checkin ausgewählt.


Option RINEX-Dateien

Dateien im Receiver INdependent Exchange-Format (RINEX) sind Standard GPS-Rohdatendateien, die von vielen gängigen Empfängerherstellern als Format zur Dateiübertragung verwendet werden.

Folgende Dateien müssen sich auf Ihrem Computer befinden, damit Sie dieses Format verwenden können:

RINEX-Datei	Dateierweiterung	Optional
Beobachtungs-datei	*.obs, *.XXo	−
Navigationsdatei	*.nav, *.XXn	−
Meteorologische Datei	*.met oder *.XXm-Datei	Diese Dateien sind optional
Führen Sie einen der folgenden Schritte aus, um RINEX-Dateien in Trimble Geomatics Office auf Ihrem Computer zu importieren:

  Verwenden Sie das Dialogfeld Importieren, und wählen Sie RINEX-Dateien (*.obs, *.??o).

  Verwenden Sie die Drag-und-Drop Funktion.

Wählen Sie die Beobachtungsdatei(en). Wenn die Beobachtungs- und Navigationsdateien nicht denselben Namen haben, können Sie die Namen dieser Dateien im Dialogfeld Passende Navigationsdateien vereinheitlichen. Navigieren Sie zur passenden .nav-Datei, oder wählen Sie eine Datei aus der Liste mit den Navigationsdateien.

Das Dialogfeld DAT-Checkin erscheint, in dem Sie die Werte in den Dateien vor dem Importieren der GPS-Beobachtungen überprüfen können. Vergewissern Sie sich, daß Antennen- und Empfängertyp bekannt sind.

Wenn die RINEX-Dateien übertragen und alle GPS-Beobachtungen in die Projektdatenbank importiert werden, wird eine Auswahlmenge erzeugt, die den gleichen Namen erhält wie die RINEX-Datei.

Werden RINEX-Dateien in ein Trimble Geomatics Office-Projekt importiert, können Sie Trimble Geomatics Office zur Verarbeitung von GPS-Basislinien und das Timeline-Modul zur Ansicht der GPS-Rohbeobachtungen verwenden (wenn das Basislinienverarbeitungsmodul installiert ist).


Survey Controller-Klassen und deren Handhabung in Trimble Geomatics Office

Wenn Punkte in Trimble Survey Controller erzeugt werden, wird ihnen eine Punktklasse zugewiesen. Importieren Sie Punkte in ein Projekt, verwendet Trimble Geomatics Office diese Klasse und die Methode, die zur Bestimmung der Punktposition dient, um dem Punkt eine Punktqualität zuzuweisen. Bei der Neuberechnung wird die Qualität zur Berechnung der Punktposition verwendet.

Die folgende Tabelle veranschaulicht die Klassen, die Trimble Survey Controller Punkten zuordnet, sowie deren Handhabung durch Trimble Geomatics Office beim Importieren.

Klasse	Beschreibung	Was beim Importieren geschieht
Festpunkt	Die Klasse Festpunkt ist die höchste Qualität, die einem Punkt in Trimble Survey Controller zugewiesen werden kann.	Die Koordinaten werden als Festpunktkoordinaten für den Punkt importiert.
Normal	Die Klasse Normal wird allen gemessenen Punkten (außer abgesteckten Punkten) zugeteilt. Die Klasse Normal kann ebenfalls eingegebenen Punkte zugewiesen werden.	Die Beobachtungen und Koordinaten für den Punkt werden importiert. Den Koordinaten wird Vermessungs-qualität zugewiesen.
Absteckung	Die Klasse Absteckung wird Punkten zugewiesen, die bei der Absteckung gemessen wurden.	Beobachtungen und Absteckungsdetails für den Punkt werden importiert. Sie können die Details wie abgesteckt im Register Absteckung des Eigenschaftsfensters ansehen.
Rückblick	Die Klasse Rückblick wird Punkten zugewiesen, die als Rückblick-Punkte im Feld definiert wurden.	Ein Rückblick-Punkt wird in Trimble Geomatics Office ebenso gehandhabt, wie ein Punkt mit der Klasse Normal.
Prüfpunkt	Die Klasse Prüfpunkt wird einer Prüfbeobachtung oder einer Position, die als doppelter Punkt eingegeben und als Prüfpunkt gespeichert wurde, zugewiesen.	“Als Prüfpunkt aktivierte” Beobachtungen werden importiert.
Gelöscht	Die Klasse Gelöscht wird Punkten zugewiesen, die in Trimble Survey Controller gelöscht oder überschrieben wurden.	Punkte mit der Klasse Gelöscht werden nicht in das Projekt in der Trimble Geomatics Office Software importiert. Eine Liste der in der .dc-Datei gelöschten Punkte ist im Bericht enthalten, der beim Importieren der Datei erstellt wird.


Qualitäten, die Koordinaten und Beobachtungen von einer .dc-Datei unter Verwendung der Survey Controller-Klassen zugewiesen werden

Wenn GPS-Positionen in Trimble Survey Controller gespeichert werden, können sie von verschiedenen Vermessungstechniken oder durch Eingabe von Koordinaten abgeleitet werden. Die dem Punkt zugeteilte Qualität hängt von der Beobachtungsmethode oder dem Status ab, der dem Punkt bei der Eingabe zugewiesen wird.

Die folgende Tabelle veranschaulicht die Qualitäten, die Koordinaten unter Verwendung der Trimble Survey Controller-Klassen zugewiesen werden.

Koordinatenmethode	Zugewiesene Qualität
Festpunkt eingegeben	Festpunkt
Normal eingegeben	Vermessung
RTK Fixed	Vermessung
RTK Float	Kartographie
L1-Code	Kartographie
Autonom	Unbekannt
WAAS	Kartographie
Wide Area Fixed	Vermessung
Wide Area Float	Kartographie
RTCM-Code	Kartographie
Kopiert	Qualität des kopierten Punkts
HINWEIS: Bei Trimble Survey Controller .dc-Dateien der Version 7.5 oder höher wird die Methode Autonom geschrieben, wenn Sie die Taste „Hier“ zur Bestimmung der Basisposition verwenden, und die Position wird mit einer unbekannten Qualität importiert. Das bedeutet, daß alle von der Basis gemessenen Punkte eine unbekannte Qualität haben werden.

Wenn Sie eine GPS-Kalibrierung durchgeführt haben und mit dem Ergebnis zufrieden sind, können Sie die Qualität der Basis auf Vermessungsqualität erhöhen, so daß allen Punkten, die von der Basis aus gemessen werden, diese Qualität zugewiesen wird.

Bei Trimble Survey Controller .dc-Dateien, die älter sind als die Version 7.5, erhält die Basisposition Vermessungsqualität, wenn Sie die Taste „Hier“ zur Bestimmung der Basisposition verwenden.

Die folgende Tabelle veranschaulicht die Qualitäten, die Beobachtungen unter Verwendung der Trimble Survey Controller-Klassen zugewiesen werden.

Beobachtungsmethode	Zugewiesene Qualität
Konventionell	Vermessung
Laser-Entfernungsmesser	Kartographie
L1 Fixed	Vermessung
L1 Float	Kartographie
L1-Code	Kartographie


Leica GSI-16 Dateien importieren
Leica GSI-16-Dateien importieren

Beim Importieren von Leica GSI-16 Formatdateien liest Trimble Geomatics Office nur Meßblöcke und Rem-Worte ein, die mit diesen Blöcken verbunden sind. Beim Importvorgang werden spezielle Worte (Datensätze) verwendet, die für die Standpunktinformationen zur Verfügung stehen. Die folgenden Wortindizes werden gelesen und beim Importvorgang von der Software interpretiert:

Index	Bedeutung	Index	Bedeutung
11	Punkt-ID (Meßblockkennzeichnung)	82	Hochwert des Punkts
21	Horizontaler Winkel	83	Orthom. Punkthöhe
22	Vertikaler Winkel	84	Rechtswert des Standpunkts
31	Schrägstrecke	85	Hochwert des Standpunkts
32	Horizontale Strecke	86	Orthom. Höhe des Standpunkts
33	Vertikale Strecke	87	Reflektorhöhe
71…79	Anmerkungsworte (für Codes und Notizen)	88	Instrumentenhöhe
81	Rechtswert des Punkts
Trimble empfiehlt, daß Sie auf der Grundlage dieser Wortindizes die folgenden Aufzeichnungsmasken für Standpunktdaten und Meßdaten auf Ihrem Leica-Instrument einstellen:

Standpunktdatenmaske	Messdatenmaske
Punkt-ID (11)	Punkt-ID (11)
Rechtswert des Standpunkts (84)	Horizontaler Winkel (21)
Hochwert des Standpunkts (85)	Vertikaler Winkel (22)
Orthom. Höhe des Standpunkts (86)	Schrägstrecke (31)
Instrumentenhöhe (88)	PPM und Prismen-Konstante (51)
Code (71)	Reflektorhöhe (87)
Notiz (72)	Code (71)
	Notiz (72)
HINWEIS: Beim Importieren geht die Software davon aus, daß die erste aufgezeichnete Beobachtung nach einem Standpunktdatensatz eine Beobachtung zum Rückblick-Punkt ist. Das erste Anmerkungswort (71) wird als Punktcode interpretiert; alle anderen Anmerkungsworte  (72…79) werden als Notiz-Datensätze interpretiert.


Optoin Digitale Nivellier-Dateien (*.dat, *.raw)
Option Digitale Nivellier-Dateien (*.dat, *.raw)

Digitale Nivellier-Dateien enthalten Daten, die in einem digitalen Nivellier gespeichert wurden.

Dateien der folgenden digitalen Nivelliere werden unterstützt:

  Trimble DiNi-Digitalnivellier

  Leica NA 2002/3003

Wenn eine digitale Niviellier-Datei importiert wird, erscheint das Dialogfeld Digitales Nivellier importieren.

HINWEIS: Dateien von einem Zeiss DiNi-Digitalnivellier müssen im M5-Format übertragen werden.


NGS Bluebook Export

Mit der NGS Bluebook-Exportoption können Sie Standard National Geodetic Survey (NGS) Bluebook-Dateien in der Trimble Geomatics Office Software erzeugen.

Bluebook-Dateien wurden von der US-Regierung definiert und sind für Vermessungen erforderlich, die sich auf das National Spatial Reference System beziehen. Das Bluebook enthält die Regeln für diese Vermessungen. Das Übermitteln dieser Dateien wird auch als “Bluebooking” bezeichnet.

Das NGS Bluebook-Dienstprogramm erstellt die folgenden Bluebook-Dateien für GPS-Basislinien:

  NGS

  B – Projektinformationen

  G – Basislinieninformationen

  SERFIL – eine ASCII-Datei, die die Standpunkt-SN (Standpunktnr.), ID, und die Namen der Stationen eines bestehenden Projekts enthält.

Im Dialogfeld NGS Bluebook-Dateien werden Daten verwendet, die mit dem gewählten Satz unabhängiger verarbeiteter Basislinien in Ihrem Projekt verknüpft sind. Bevor Sie NGS-Dateien exportieren, müssen Sie zuerst die gesamte Feldarbeit beenden, die Daten verarbeiten und eine Qualitätssicherung durchführen. Wenn Sie Basislinien auswählen und den Exportvorgang einleiten, können Sie keine weiteren Basislinien zum Bluebooking-Dialogfeld hinzufügen; Sie müssen den Exportvorgang erneut starten, um weitere Basislinien hinzuzufügen.

HINWEIS: Eine Beschreibung der erforderlichen Daten für die Felder im Dialogfeld NGS Bluebook Export finden Sie in  “Input Formats and Specifications of the National Geodetic Survey (NGS) Data Base”. Die NGS-Referenz ist unter folgender Adresse erhältlich: http://www.ngs.noaa.gov/FGCS/BlueBook/


Dialogfeld NGS Bluebook-Dateien

Mit dem NGS Bluebook-Exportfilter können Sie Standard National Geodetic Survey (NGS) Bluebook-Dateien in Trimble Geomatics Office erzeugen.

Das Dialogfeld NGS Bluebook-Dateien verwendet Daten, die mit dem gewählten Satz unabhängiger verarbeiteter Basislinien in Ihrem Projekt verknüpft sind. Bevor Sie NGS-Dateien exportieren, müssen Sie zuerst die gesamte Feldarbeit beenden, die Daten verarbeiten und eine Qualitätssicherung durchführen. Wenn Sie Basislinien auswählen und den Exportvorgang einleiten, können Sie keine weiteren Basislinien zum Bluebooking-Dialogfeld hinzufügen; Sie müssen den Exportvorgang erneut starten, um weitere Basislinien hinzuzufügen.

So greifen Sie auf das Dialogfeld NGS Bluebook-Dateien zu:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie im Register Vermessung die Option NGS Bluebook-Dateien.

HINWEIS: Wenn Sie bereits eine Bluebook-Sitzung gespeichert haben, werden Sie gefragt, ob die gespeicherten Informationen geladen werden sollen.

Verwenden Sie die Register im Dialogfeld NGS Bluebook Export, um Informationen über das Projekt einzugeben.

Register Project

Dieses Register enthält allgemeine Informationen über das Projekt.

Register Station

Dieses Register enthält eine Liste aller Standpunkte, die mit den ausgewählten Basislinien verbunden sind:

  Fügen Sie die Kennung (ID mit 4 Buchstaben) und die Standpunkt-SN (Standpunktnr.) hinzu. Verwenden Sie dazu die Schaltflächen Auto-Generate. Die ID wird unter Verwendung der ersten vier Buchstaben des Standpunktnamens erzeugt. Die SNs werden nacheinander erzeugt, beginnend bei 0001oder der ersten verfügbaren Zahl.

  Die Spalte State/Country Code wird automatisch mit den Informationen im Register Project ausgefüllt.

  Wählen Sie die Reihenfolge aus der Liste.

  In der Spalte Type wird automatisch das A-Interferometric Satellite Relative Positioning Main Scheme angezeigt, da alle Bluebooking-Daten mit GPS-Methoden erfaßt wurden.

  Verwenden Sie die Schaltfläche SERFIL, um bestehende Standpunktkennungen mit vier Buchstaben und Standpunktnummern unter Verwendung eines SERFIL aus einem anderen Projekt zu importieren. Das SERFIL muß den Standpunktnamen für jeden Standpunkt enthalten. Dieses Format unterscheidet sich etwas vom NGS SERFIL-Format, die NGS kann diese Datei aber trotzdem verwenden. Das folgende Format muß verwendet werden:

ID mit 4 Zeichen   Standpunktnr./ SN    Standpunktname

COWB 	  0004   	  COWBOY

Register Session Information

Dieses Register enthält Informationen über jede Feldsitzung der ausgewählten Basislinien. Die unterschiedlichen Farben stellen die individuellen Basisliniensitzungen dar.

  Die Startzeit (Start Time) bezeichnet den Zeitpunkt, an dem alle Empfänger in der Sitzung zuletzt gestartet wurden und muß nicht unbedingt die Startzeit für jede einzelne Basislinie sein. Diese Zeit sollte nur beim Vergleich der Sitzungen mit den Feldbucheinträgen als Referenz verwendet werden.

  Der Empfängertyp und die Seriennummer werden automatisch in die Spalte Receiver eingetragen.

  Der Antennentyp wird automatisch in die Spalte Antenna eingetragen, Sie müssen allerdings die Seriennummer eintragen. Nachdem die Seriennummer der Antenne eingetragen wurde, kann sie aus einer Dropdown-Liste ausgewählt werden.

  Die tatsächliche Antennenhöhe, gemessen zum L1-Phasenzentrum, wird automatisch in die Spalte Antenna Height (Meters/APC L1) eingetragen. Die tatsächliche Antennenhöhe wird entweder aus der Antennenhöhe, die im Feld eingegeben wurde, oder aber beim Check-in berechnet.

Register Pre Session Weather und Post Session Weather

Die Register Pre und Post Session Weather enthalten Wetterinformationen für jede Besetzung, die mit den gewählten Basislinien verknüpft ist. Diese Felder werden benötigt, wenn eine Vermessung der Klasse B oder höher ausgeführt wird. Das Sternchen in der Registerüberschrift wird automatisch gelöscht, wenn die Option 1st Order survey im Register Project gewählt wird.

Dieses Feld	Zeigt gemäß Voreinstellung folgendes an:
Dry bulb (Trockentemp.)	Grad Celsius
Wet bulb (Feuchttemp.)	Grad Celsius
Humidity (Luftfeuchtigkeit)	Prozent
Pressure (Druck)	Millibar-Einheiten
  Das Feld Weather Code wird durch direkte Eingabe des Codes mit Hilfe der Schaltfläche Edit Current Field (Aktuelles Feld bearbeiten) ausgefüllt.

  Mit der Schaltfläche Edit Current Field können Sie die Codes der einzelnen Variablenbeschreibungen ansehen und auswählen.

  Die Felder Copy to Pre- (Post) Session Weather werden verwendet, um dieselben Daten aus dem Register Pre Session Weather in das Register Post Session Weather zu kopieren, und umgekehrt.

Register Miscellaneous

Das Register Miscellaneous enthält allgemeine Verarbeitungsinformationen.

Equipment

Mit der Schaltfläche Equipment können Sie Informationen über die einzelnen Empfänger und Antennen ansehen, hinzufügen und bearbeiten. Nur die mit dem Projekt assoziierte Ausrüstung wird angezeigt.

OK

Die Schaltfläche OK schließt das Dialogfeld NGS Bluebook-Dateien und speichert die Informationen in jedem Register. Wenn Sie große Datenmengen eingeben, können Sie Ihre Eingabe speichern und sie später erneut aufrufen.

Export

Die Schaltfläche Export steht zur Verfügung, nachdem alle Felder ausgefüllt wurden. Mit der Schaltfläche Export können Sie einen Namen für jede Datei eingeben und einen Pfad für jede Datei wählen. Der voreingestellte Pfad ist Trimble Geomatics Office\Projekte\<Projektname>\Export.

HINWEIS: Wenn die erforderlichen Felder in jedem Register ausgefüllt werden, wird das * neben jedem Namen entfernt. Nachdem alle Felder im Dialogfeld ausgefüllt wurden, wird die Schaltfläche Export verfügbar.

HINWEIS: Eine Beschreibung der für die einzelnen Felder erforderlichen Daten des Dialogfelds NGS Bluebook Export finden Sie in “Input Formats and Specifications of the National Geodetic Survey (NGS) Data Base”. Die NGS-Referenz ist unter folgender Adresse erhältlich: http://www.ngs.noaa.gov/FGCS/BlueBook/


Trimble Datenaustauschformat

 Wie kann ich. . .

Das Trimble Datenaustauschformat wurde von Trimble Navigation Limited entwickelt, um:

  Vermessungsdaten zwischen Trimble Geomatics Office-Projekten zu übertragen

  Vermessungsdaten in andere Anwendungen für Netzausgleichungen oder andere geodätische Vorgänge zu exportieren

HINWEIS: Prüfen Sie, ob der Hersteller Ihrer Netzausgleichungssoftware dieses Format unterstützt.

Wählen Sie die Option Trimble Datenaustauschformat in den Dialogfeldern Importieren oder Exportieren, um Daten mit Hilfe dieses Formats zu importieren oder zu exportieren.

Eine ASCII-Datei enthält folgende Informationen:

Standpunkte und Koordinaten	GPS-Basislinien
Terrestrische Beobachtungen	Laser-Beobachtungen
Nivellier-Informationen	Azimut-Informationen
Die Datei ist in folgende Abschnitte unterteilt:

[General]

Dieser Abschnitt enthält allgemeine Informationen über den Dateiinhalt, über das Projekt, aus dem die Datei stammt und über die Einheiten, die in den verschiedenen Feldern verwendet wurden.

[Stations]

Dieser Abschnitt enthält die Namen und Koordinaten aller Punkte, die zur Übertragung ausgewählt wurden. Die Koordinaten in diesem Abschnitt sind immer im örtlichen Datum angegeben. Die einzelnen Beobachtungen sind in den Standpunkt-Datensätzen enthalten; sie enthalten den Breitengrad, Längengrad, Hochwert und Rechtswert. Ellipsoidische und orthometrische Höhen können ebenfalls in jedem Datensatz enthalten sein.

Der Standpunkt-Datensatz enthält ebenfalls Informationen darüber, welche Koordinatenkomponenten als Festpunkte identifiziert wurden sowie den Kartiercode, der dem Standpunkt zugewiesen wurde.

[GPS]

Dieser Abschnitt enthält die GPS-Basislinien, die zur Übertragung ausgewählt wurden. Die einzelnen Beobachtungen sind in den Vektor-Datensätzen enthalten. Diese Datensätze enthalten:

Die Von- und Zu- Standpunktnamen	Basislinien-komponenten
Kovarianzinformationen	Antennenhöhen
Den Verarbeitungstyp	Das Verhältnis
Den RMS	Die Referenzvarianz
Zeit und Datum der Beobachtungen
[Terrestrial]

Dieser Abschnitt enthält die terrestrischen Beobachtungen, die zur Übertragung ausgewählt wurden. Die einzelnen Beobachtungen sind in den TerrObs-Datensätzen enthalten. Diese Datensätze enthalten:

Instrumentenpunkt	Rückblick-Punkt
Vorblick-Punkt	Horizontaler Winkel und Fehler
Vertikaler Winkel und Fehler	Schrägstrecken und Fehler
Prismen-Konstante	Instrumentenhöhe
Datum und Zeit der Beobachtung (falls verfügbar)	Zielhöhe
[Laser]

Dieser Abschnitt enthält die Laser-Beobachtungen, die zur Übertragung ausgewählt wurden. Die einzelnen Beobachtungen sind in den LaserObs-Datensätzen enthalten. Diese Datensätze enthalten:

Instrumentenpunkt	Magnetische Deklination
Magnetischer Azimut	Schrägstrecke
Vertikaler Winkel	Zielhöhe
Instrumentenhöhe	Zielpunkt
Datum und Zeit der Beobachtung (falls verfügbar)
[Level]

Dieser Abschnitt enthält die Nivellierbeobachtungen, die zur Übertragung ausgewählt wurden. Die einzelnen Beobachtungen sind in den LevelObs-Datensätzen enthalten. Diese Datensätze enthalten:

Punkte am Anfang und Ende des Nivellements	Höhenunterschied und Fehler
Strecke (falls verfügbar)	Anzahl Drehungen (falls verfügbar)
Datum und Zeit der Beobachtung (falls verfügbar)
[Azimuth]

Dieser Abschnitt enthält die Azimut-Datensätze. Diese Datensätze enthalten individuelle Beobachtungen.


Terramodel-Projektdateien (*.pro)

Trimble Geomatics Office unterstützt das Terramodel-Projektdateiformat (*.pro).

Verwenden Sie Trimble Geomatics Office, um eine Terramodel-Projektdatei (*.pro) in ein Trimble Geomatics Office-Projekt zu importieren:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register CAD / ASCII.

3.	Wählen Sie die Option Terramodel-Projekt (*.pro).

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.

HINWEIS: Nur Punkte, Liniennetze und Layer werden aus Terramodel-Projektdateien importiert (*.pro).


TDS-Software - Überblick
TDS-Software − Überblick

Siehe auch

Trimble Geomatics Office unterstützt Dateien von folgender TDS-Software:

  TDS Survey Pro CE

  TDS 3600 (onboard)

  TDS 5600 (onboard)

Sie können TDS-Dateien zu und von Ihrem PC oder auch mit der Import-/Exportoption Vermessungsgeräte direkt zu und von der TDS-Software übertragen.

HINWEIS: Trimble Geomatics Office unterstützt keine TDS-Festpunktdateien. Sie müssen die Punkte aus anderen Festpunktdateien importieren, die im Hauptprojekt verwendet wurden, bevor Sie Dateien übertragen können. Weitere Informationen finden Sie in Ihrer TDS-Dokumentation.

HINWEIS: Trimble Geomatics Office unterstützt keine TDS-Merkmale und -Attribute.

TDS Survey Pro CE

Trimble Geomatics Office unterstützt die folgenden TDS Survey Pro CE-Dateien:

Name	Erweiterung	Importieren	Exportieren	Beschreibung
Job	*.job			Enthält Punkte und Koordinateninformationen. Importieren Sie eine Projektdatei (*.job), wenn ausschließlich Punkte aus einem TDS Survey Pro CE-Projekt importiert werden sollen.
Raw	*.raw		X	Enthält Beobachtungsinformationen. Importieren Sie eine Rohdatendatei (*.raw), wenn sowohl Punkte als auch Beobachtungen aus einem TDS Survey Pro CE-Projekt importiert werden sollen.
Description	*.txt	X		Eine einfache Textdatei mit Kartiercodes, mit deren Hilfe Sie Punktbeschreibungen in TDS Survey Pro CE eingeben können.
Geoid Grid	*.ggf	X		Geoid-Abstände des WGS84-Referenzellipsoids (TDS Survey Pro CE Version 3.5 oder höher)

Informationen zum Exportieren einer/eines:

  Kurvenbanddefinition (*.job, *.rd5, *.tp5) aus RoadLink finden Sie in der RoadLink-Hilfe.

  DGMs (*.dtm) aus DTMLink finden Sie in der DTMLink-Hilfe.

Weitere Informationen über die vorstehend genannten Dateien finden Sie in Ihrer TDS-Dokumentation.

Trimble Geomatics Office bietet auch Koordinatensystemunterstützung für alle Versionen der TDS Survey Pro CE-Software. Dies beinhaltet ebenfalls Unterstützung für die erweiterten geodätischen Funktionen von TDS Survey Pro CE 3.5 oder höher, wenn die Software mit einem Trimble GPS-Empfänger verwendet wird. Alle aus TDS Survey Pro CE importierten Dateien enthalten eine komplette Koordinatensystem-Definition, die mit der Definition in einer Survey Controller (*.dc)-Datei identisch ist.

HINWEIS: GPS-Beobachtungen aus TDS Survey Pro CE 3.5 oder höher werden nur bei der Verwendung eines Trimble GPS-Empfängers importiert. Terrestrische Beobachtungen aus beliebigen Totalstationen werden von allen Versionen unterstützt.

Trimble 3600/5600 TDS

Trimble Geomatics Office unterstützt folgende Dateien aus der Trimble 3600/5600 TDS-Software:

Name	Erweiterung	Import	Export	Beschreibung
Coordinate	*.cr5			Enthält Punkte und Koordinateninformationen. Importieren Sie eine Koordinatendatei (*.cr5), wenn ausschließlich Punkte aus einem Trimble 3600/5600 TDS-Projekt importiert werden sollen.
Raw	*.rw5		X	Enthält Beobachtungsinformationen. Importieren Sie eine Rohdatendatei (*.rw5), wenn sowohl Punkte als auch Beobachtungen aus einem Trimble 3600/5600 TDS-Projekt importiert werden sollen.
Description	*.txt	X		Eine einfache Textdatei mit Kartiercodes, mit deren Hilfe Sie Punktbeschreibungen in TDS Survey Pro CE eingeben können.
Informationen zum Exportieren einer/eines:

  Kurvenbanddefinition (*.cr5, *.rd5, *.tp5) aus RoadLink finden Sie in der RoadLink-Hilfe.

  DGMs (*.dtm) aus DTMLink finden Sie in der DTMLink-Hilfe.

Weitere Informationen über die vorstehend genannten Dateien finden Sie in Ihrer TDS-Dokumentation.

Dateien, die aus der Trimble 3600/5600 TDS-Software importiert wurden, enthalten keine vollständigen Koordinatensystem-Definitionen. Dateien werden unter Verwendung von Nur-Maßstabs-Koordinatensystemen importiert. Dies entspricht den Koordinatensystemen in Survey Controller (*.dc)-Dateien.

Beim Importieren von Dateien definiert Trimble Geomatics Office das Koordinatensystem mit dem zuletzt im TDS Survey Pro CE-Projekt verwenden Nur-Maßstabs-Koordinatensystem.

HINWEIS: Wenn Trimble 3600/5600 TDS-Koordinatendateien importiert werden, importiert Trimble Geomatics Office die Koordinatendatei (*.cr5) und dann Daten aus der damit verknüpften Rohdatendatei (*.rw5), wenn sich diese im selben Ordner auf Ihrem Computer befinden. Wenn nur Koordinaten importiert werden sollen, vergewissern Sie sich, daß keine Rohdatendatei gleichen Namens im selben Ordner auf dem Computer vorhanden ist. Rohdatendateien können auch einzeln importiert werden.


TDS Survey Pro CE-Projektdateien (*.job)

Trimble Geomatics Office unterstützt Daten im TDS Survey Pro CE-Projektdateiformat (*.job).

Verwenden Sie Trimble Geomatics Office, um:

  eine TDS Survey Pro CE-Projektdatei in ein Trimble Geomatics Office-Projekt zu importieren.

  ein Trimble Geomatics Office-Projekt in eine TDS Survey Pro CE-Projektdatei zu exportieren.

Sie können auch Dateien unter Verwendung der Export-/Importoption Vermessungsgeräte direkt zu und von der TDS Survey Pro CE-Software übertragen.

So importieren Sie eine TDS Survey Pro CE-Projektdatei:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Survey Pro CE-Projektdatei (*.job), und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.

HINWEIS: Das TDS Survey Pro CE-Projektdateiformat enthält Punkte und damit verknüpfte Koordinaten. Verwenden Sie diese Option, wenn nur Punkte aus einem TDS Survey Pro CE-Projekt importiert werden sollen.

So exportieren Sie das aktuelle Trimble Geomatics Office-Projekt in eine TDS Survey Pro CE-Projektdatei:

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option TDS Survey Pro CE-Projektdatei (*.job), und klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint.

4.	Wählen Sie den Ordner, in dem die Datei gespeichert werden soll.

5.	Geben Sie einen Namen in das Feld Dateiname ein, und klicken Sie auf Speichern.

HINWEIS: Wenn doppelte Punkte in den zu exportierenden Daten enthalten sind, wird keine TDS Survey Pro CE-Projektdatei erstellt. Vergewissern Sie sich, daß alle zu exportierenden Punkte eindeutige Namen haben.


TDS Survey Pro CE-Rohdatendateien (*.raw)

Verwenden Sie Trimble Geomatics Office, um eine TDS Survey Pro CE-Rohdatendatei in ein Trimble Geomatics Office-Projekt zu importieren. Sie können auch Dateien unter Verwendung der Export-/Importoption Vermessungsgeräte direkt zu und von der TDS Survey Pro CE-Software übertragen. Verwenden Sie diese Option, wenn sowohl Punkte als auch Beobachtungen aus einem TDS Survey Pro CE-Projekt übertragen werden sollen.

So importieren Sie eineTDS Survey Pro CE-Rohdatendatei:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option TDS Survey Pro CE-Rohdatendatei (*.raw), und klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die zu importierende Datei aus dem Ordner, und klicken Sie auf Öffnen.


Trimble 3600/5600 TDS-Koordinatendateien (*.cr5)

Verwenden Sie Trimble Geomatics Office, um:

  eine Trimble 3600/5600 TDS-Koordinatendatei in ein Trimble Geomatics Office-Projekt zu importieren.

  ein Trimble Geomatics Office-Projekt in eine Trimble 3600/5600 TDS-Koordinatendatei zu exportieren.

Sie können auch Dateien unter Verwendung der Export-/Importoption Vermessungsgeräte direkt zu und von der Trimble 3600/5600 TDS-Software übertragen.

So importieren Sie eine Trimble 3600/5600 TDS-Koordinatendatei:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Trimble 3600/5600 TDS-Koordinatendateien (*.cr5).

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.

HINWEIS: Wenn Trimble 3600/5600 TDS-Koordinatendateien importiert werden, importiert Trimble Geomatics Office zuerst die Koordinatendatei (*.cr5) und dann Daten aus der damit verknüpften Rohdatendatei (*.rw5), wenn sich diese im selben Ordner auf Ihrem Computer befindet. Wenn sich die Rohdatendatei nicht im selben Ordner befindet, wie die Koordinatendatei, werden nur Punkte importiert.

So exportieren Sie das aktuelle Trimble Geomatics Office-Projekt in eine Trimble 3600/5600 TDS-Koordinatendatei:

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Trimble 3600/5600 TDS-Koordinatendateien (*.cr5).

4.	Klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint.

5.	Wählen Sie den Ordner, in dem die Datei gespeichert werden soll.

6.	Geben Sie einen Namen in das Feld Dateiname ein, und klicken Sie auf Speichern.

HINWEIS: Wenn doppelte Punkte in den zu exportierenden Daten enthalten sind, oder ein Punkt einen alphanumerischen Namen hat, wird keine 3600/5600 TDS-Koordinatendatei erstellt. Vergewissern Sie sich, daß alle zu exportierenden Punkte eindeutige numerische Namen haben.


Trimble 3600/5600 TDS-Rohdatendateien (*.rw5)

Verwenden Sie Trimble Geomatics Office, um eine Trimble 3600/5600 TDS-Rohdatendatei in ein Trimble Geomatics Office-Projekt zu importieren. Sie können auch Dateien unter Verwendung der Export-/Importoption Vermessungsgeräte direkt zu und von der Trimble 3600/5600 TDS-Software übertragen. Verwenden Sie diese Option, wenn sowohl Punkte als auch Beobachtungen aus einem 3600/5600 TDS-Projekt übertragen werden sollen.

So importieren Sie eine Trimble 3600/5600 TDS-Rohdatendatei:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Trimble 3600/5600 TDS-Rohdatendateien (*.rw5).

Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.


TDS-Beschreibungsdateien (*.txt)

Die TDS Survey Pro CE-Software und die Trimble 3600/5600 TDS-Software verwenden Beschreibungsdateien zur automatischen Eingabe von Beschreibung für in Projekten gespeicherte Punkte. Weitere Informationen über Beschreibungsdateien finden Sie in Ihrer TDS-Dokumentation.

Verwenden Sie Trimble Geomatics Office, um:

  eine Beschreibungsdatei (*.txt) aus dem Feature Code Editor zu importieren.

  eine bestehende Beschreibungsdatei (*.txt) entweder in die TDS Survey Pro CE-Software oder in die Trimble 3600/5600 TDS-Software zu exportieren.

  eine Beschreibungsdatei (*.txt) aus einer Merkmals- und Attributbibliothek entweder in die TDS Survey Pro CE- oder in die Trimble 3600/5600 TDS-Software zu exportieren.

Informationen zum Exportieren einer Beschreibungsdatei aus dem Feature Code Editor finden Sie in der Feature Code Editor-Hilfe.

So exportieren Sie eine bestehende Beschreibungsdatei zur TDS Survey Pro CE- oder zur Trimble 3600/5600 TDS-Software:

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Beschreibungsdatei zu TDS-Gerät (*.txt), und klicken Sie auf OK.

Das Dialogfeld Wählen erscheint.

4.	Wählen Sie die zu exportierende Datei, und klicken Sie auf Öffnen.

Das Dialogfeld Speichern unter erscheint.

5.	Wählen Sie ein TDS-Gerät, und klicken Sie auf Öffnen.

Die Datei wird exportiert.

So exportieren Sie eine neue Beschreibungsdatei aus einer Merkmals- und Attributbibliothek zur TDS Survey Pro CE- oder zur Trimble 3600/5600 TDS-Software:

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Merkmals- und Attributbibliothek zu TDS-Gerät (*.txt), und klicken Sie auf OK.

Das Dialogfeld Merkmals- und Attributbibliothek wählen erscheint.

4.	Wählen Sie die zu exportierende Bibliothek, und klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint.

5.	Wählen Sie ein TDS-Gerät, und klicken Sie auf Öffnen.

Die Datei wird exportiert.


Zeiss - Überblick
Zeiss − Überblick

Trimble Geomatics Office unterstützt M5-Dateien von folgenden Zeiss-Instrumenten:

  Trimble 3300

  Trimble 3600 Elta

  Trimble 5600 Elta

  Trimble Elta GPS Controller

  Trimble DiNi-Digitalnivellier

Sie können M5-Dateien zu und von Ihrem PC oder unter Verwendung der Import-/Exportoption Vermessungsgeräte direkt zu oder von dem Instrument übertragen.

Zeiss-Dateien werden von Trimble Geomatics Office wie folgt unterstützt:

Dateiformat	Unterstützt
Elta M5-Dateien (Nur englisch und deutsch)	Ja
Rec 500, R4 und R5	Nein.  Die Trimble Geomatics Office-CD enthält ein Programm zur Konvertierung von M5 und Rec 500 Formaten, falls erforderlich.
Elta Codelisten-Dateien	Nein

Exportieren

Trimble Geomatics Office exportiert Gitter-Punktnamen, Codes, Beschreibungen und Koordinaten in M5-Dateien. Andere Daten, z. B. Beobachtungen, werden nicht exportiert.

HINWEIS: Die Koordinaten in der exportierten Datei haben dieselbe Anzahl an Dezimalstellen, wie das Trimble Geomatics Office-Projekt, es werden jedoch mindestens 3 Dezimalstellen für Trimble 3300-Instrumente und 4 Dezimalstellen für Trimble 3600/5600 Elta- und Trimble Elta GPS Controller-Instrumente ausgegeben.

Importieren

HINWEIS: Das M5-Dateiformat unterstützt keine kompletten Koordinatensystem-Definitionen. Dateien werden unter Verwendung von Nur-Maßstab-Koordinatensystemen importiert. Dies entspricht dem Importieren von Nur-Maßstab-Koordinatensystemen in eine Survey Controller (*.dc)-Datei. Sie können beim Definieren des Import-Koordinatensystems in Trimble Geomatics Office einen Maßstabsfaktor eingeben.

Einheiten

Das M5-Format hat entweder "m"-Einheiten (metrisch und Namibische Meter) oder "ft"-Einheiten (Internationale Fuß und US-Vermessungs-Fuß).

Wenn beim Exportieren oder Importieren einer M5-Datei im Projekt und im Instrument unterschiedliche Einheiten verwendet werden, geht Trimble Geomatics Office davon aus, daß sich die "m" in der M5-Datei auf metrische Einheiten und die "ft" auf Internationale Fuß beziehen.

Trimble DiNi-Digitalnivellier

HINWEIS: Trimble Geomatics Office kann keine Daten zu einem Trimble DiNi-Digitalnivellier exportieren.

Weitere Informationen zum Importieren von Daten von einem Trimble DiNi-Digitalnivellier finden Sie unter der Importoption Digitale Nivellier-Dateien (*.dat, *.raw).


Trimble 3300/3600/5600 Elta M5-Dateien (*.dat)

Verwenden Sie Trimble Geomatics Office, um:

  Trimble 3300/3600/5600 Elta M5-Dateien (*.dat) in ein Trimble Geomatics Office-Projekt zu importieren.

  ein Trimble Geomatics Office-Projekt in eine Trimble 3300/3600/5600 Elta M5-Koordinatendatei (*.dat) zu exportieren.

Sie können auch Dateien unter Verwendung der Export-/Importoption Vermessungsgeräte direkt zu und von Trimble 3300-, 3600 Elta- oder 5600 Elta-Onboard-Software übertragen.

Vergewissern Sie sich, daß die M5-Dateioptionen für Trimble 3300/3600/5600 Elta M5-Dateien (*.dat) konfiguriert sind, bevor Sie Elta M5-Dateien übertragen.

So importieren Sie Elta M5-Dateien (*.dat):

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Trimble 3300/3600/5600 Elta M5-Dateien (*.dat).

4.	Klicken Sie auf Optionen, um das Dialogfeld M5-Dateien zu öffnen, und konfigurieren Sie die Datei.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

7.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.

HINWEISE:

 	Örtliche (relative) Koordinaten in der M5-Datei (z. B. "neh" oder "xyz") werden beim Importieren in absolute Koordinaten konvertiert.

  	Nach dem Importieren von M5-Dateien werden alle Prismen-Konstanten in Trimble Geomatics Office als "?" angezeigt. Geben Sie in das Feld Prismen-Konstante im Eigenschaftsfenster den Unterschied zwischen der im Feld eingegebenen Prismen-Konstante und der tatsächlichen Prismen-Konstante ein, um dies zu ändern. Wenn Sie z. B. eine Prismen-Konstante von "20" eingegeben haben, und die tatsächliche Prismen-Konstante "5" beträgt, müssen Sie "–15" eingeben.

  	Trimble Geomatics Office unterstützt keine orthogonalen Absteckungsdeltas. Diese werden beim Importieren in Polar-Absteckungsdeltas konvertiert. Trimble empfiehlt, das Instrument so zu konfigurieren, daß nur Absteckungsdeltas für Gitterkoordinaten gespeichert werden.

  	Trimble Geomatics Office unterstützt keine horizontalen Winkel idie sich nach links erhöhen. Verwenden Sie diese Einstellung nicht am Instrument.

Instrumentenkonfiguration

Vergewissern Sie sich beim Importieren gemittelter Beobachtungen in 2. Lage von einem Trimble 3600/5600 Elta-Instrument, daß das Instrument so konfiguriert ist, daß nur Einzelwerte (Single Values) gespeichert werden. Wenn sowohl Einzelwerte als auch Durchschnittswerte gewählt sind, berechnet Trimble Geomatics Office inkorrekte Werte. Darüber hinaus zeigt Trimble Geomatics Office gemittelte Beobachtungen als Beobachtungen in 1. Lage an, wenn nur die Option Durchschnitt/Mittel (Average) gewählt ist.

Trimble Geomatics Office geht davon aus, daß bei Trimble 3600/5600 Elta-Instrumenten die atmosphärischen Korrekturen immer aktiviert sind. Deaktivieren Sie diese Korrekturen am Instrument nicht.

Sie müssen (wenn möglich) die R-MC-Speicheroption in Trimble 3600/5600 Elta-Instrumenten und die MEM/3-Speicheroption in Trimble 3300-Instrumenten verwenden, um sicherzustellen, daß sowohl Koordinaten als auch Beobachtungsdaten für die Berechnungen zur Verfügung stehen.

Stationierung

Führen Sie vor dem Messen immer eine Stationierungsroutine auf dem Instrument aus, um sicherzustellen, daß Trimble Geomatics Office Daten richtig interpretiert.

Rückblick-Datensätze, die von dem Standpunkt gelöscht wurden, werden immer noch in Trimble Geomatics Office importiert. Deaktivieren Sie diese Beobachtungen im Eigenschaftsfenster.

Trimble Geomatics Office unterstützt keine mehrfachen Rückblick-Punkte. Wenn mehrere Rückblick-Punkte bei der Stationierungsroutine gemessen werden, verwendet Trimble Geomatics Office den letzen Punkt als Rückblick-Punkt.

Nicht unterstützte Elta-Funktionen

Die folgenden Elta-Instrumentenroutinen geben spezielle Daten aus, die nicht von Trimble Geomatics Office unterstützt werden. In den meisten Fällen können jedoch Beobachtungen aus diesen Routinen in Trimble Geomatics Office importiert werden.

 Vertikale Ebene

  Flächenberechnung

  Spannmaße

  Transformationen

  Trassierung

  Richtungssätze

  Allgemeine Ebene

So exportieren Sie das aktuelle Trimble Geomatics Office-Projekt in eine Elta M5-Datei (*.dat):

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Heben Sie die Option Trimble 3300/3600/5600 Elta M5-Dateien (*.dat) hervor.

4.	Klicken Sie auf Optionen, um das Dialogfeld M5-Dateioptionen zu öffnen, und konfigurieren Sie die Datei.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint.

7.	Wählen Sie den Ordner, in dem die Datei gespeichert werden soll.

8.	Geben Sie einen Namen in das Feld Dateiname ein, und klicken Sie auf Speichern.


Trimble Elta GPS Controller M5-Dateien (*.dat)

In Trimble Geomatics Office können Sie:

  eine M5-Datei aus einer Elta GPS-Kontrolleinheit mit der Elta Controller-Software in ein Trimble Geomatics Office-Projekt importieren.

  Daten aus einen Trimble Geomatics Office-Projekt in eine Elta GPS Controller M5-Koordinatendatei exportieren.

Sie können auch Dateien unter Verwendung der Export-/Importoption Vermessungsgeräte direkt zu und von Trimble Elta GPS Controller Software übertragen.

Vergewissern Sie sich, daß die M5-Dateioptionen für Trimble Elta GPS Controller M5-Dateien (*.dat) konfiguriert sind, bevor Sie Elta GPS Controller M5-Dateien übertragen.

So importieren Sie Elta GPS Controller M5-Dateien:

1.	Wählen Sie Datei / Importieren.

Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Trimble Elta GPS Controller M5-Dateien (*.dat).

4.	Klicken Sie auf Optionen, um das Dialogfeld M5-Dateioptionen zu öffnen, und konfigurieren Sie die Datei.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Importieren zurückzukehren.

6.	Klicken Sie auf OK.

Das Dialogfeld Öffnen erscheint.

7.	Wählen Sie die zu importierende Datei, und klicken Sie auf Öffnen.

HINWEIS: Trimble Geomatics Office importiert die Koordinaten aus der M5-Datei nur als Gitterpunkte. Sie müssen zu Beginn der Vermessung eine Kalibrierung (Transformation) im Feld durchführen, um sicherzustellen, daß die Trimble Geomatics Office-Koordinaten mit den Trimble Elta GPS Controller-Koordinaten übereinstimmen.

So exportieren Sie das Trimble Geomatics Office-Projekt in eine Elta GPS Controller M5-Datei:

1.	Wählen Sie Datei / Exportieren.

Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Heben Sie die Option Trimble Elta GPS Controller M5-Dateien (*.dat) hervor.

4.	Klicken Sie auf Optionen, um das Dialogfeld M5-Dateioptionen zu öffnen, und konfigurieren Sie die Datei.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK.

Das Dialogfeld Speichern unter erscheint.

7.	Wählen Sie den Ordner, in dem die Datei gespeichert werden soll.

8.	Geben Sie einen Namen in das Feld Dateiname ein, und klicken Sie auf Speichern.


Dialogfeld M5-Dateioptionen

Verwenden Sie das Dialogfeld M5-Dateioptionen, um folgende Dateien für den Import/Export zu konfigurieren:

  Trimble 3300/3600/5600 Elta M5-Dateien

  Trimble Elta GPS Controller M5-Dateien

Legen Sie den Instrumententyp, die Dateikennzeichnungen, die Koordinateneinstellungen und (für den Import) die Einstellungen für doppelte Punkte fest.

So greifen Sie auf das Dialogfeld Optionen zu:

1.	Wählen Sie Datei / Exportieren (oder Importieren).

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie eine der folgenden Optionen:

  Trimble 3300/3600/5600 Elta M5-Dateien (*.dat)

  Trimble Elta GPS Controller M5-Dateien (*.dat)

4.	Klicken Sie auf Optionen.

Dateikennzeichnungen

Wählen Sie eine der folgenden Optionen:

  Voreinstellung (Trimble empfiehlt die Verwendung dieser Option)

Klicken Sie auf Fortgeschritten, um die Voreinstellungen für das Zeilenformat (Einstellungen Linienformat) und die Formatvorschau anzusehen.

HINWEIS: Die voreingestellten Werte sind unterschiedlich, abhängig vom gewählten Instrumententyp.

  Benutzerdefiniert

Mit der Option Benutzerdefiniert können Sie die Einstellungen für das Zeilenformat ändern und die Änderungen im Abschnitt Formatvorschau ansehen. Wählen Sie Benutzerdefiniert, und klicken Sie auf Fortgeschritten. Führen Sie im Dialogfeld Erweiterte Kennzeichnungsoptionen folgendes aus:

a.	Legen Sie die Position der Anfangszeichen für den Punktnamen, den Code und die Beschreibung fest.

b.	Legen Sie die Feldbreite für den Punktnamen, den Code und die Beschreibung fest.

c.	Geben Sie eine Kennzeichnungsnr. ein.

HINWEIS: Wenn die benutzerdefinierten Zeilenformateinstellungen ungültig sind, fordert Trimble Geomatics Office Sie auf, gültige Konfigurationseinstellungen einzugeben.

Koordinateneinstellungen

Wählen Sie aus den Dropdown-Listen Koordinatenfolge und Höhe die Koordinatenreihenfolge und die Koordinatenbeschriftungen für die zu importieren/zu exportierende Datei.

HINWEISE:

Welche Felder verfügbar sind, hängt vom gewählten Instrumententyp ab.

Punktnamen, Codes und Beschreibungen, die zu lang sind, um angezeigt zu werden, werden beim Exportieren abgekürzt.

Punkte mit alphanumerischen Namen werden nicht zu Trimble 3300-Instrumenten exportiert.


Punkte - Überblick
Punkte − Überblick

Punkte stehen im Mittelpunkt eines Trimble Geomatics Office-Projekts. Punkte werden jedesmal zu dem Projekt hinzugefügt, wenn Sie Daten importieren oder einen Punkt unter Verwendung des Dialogfelds Punkte einfügen oder des Dialogfelds Punkte nach Azimut und Strecke einfügen hinzufügen.

Punkte sind in der Vermessungsansicht und der Planansicht sichtbar. Wählen Sie einen Punkt, und öffnen Sie das Eigenschaftsfenster, um die Details eines Punkts anzusehen.

Ein Punkt hat eine berechnete Position, die bei der Neuberechnung bestimmt wird. Diese Position ist die beste Position für den Punkt, wobei alle eingegebenen Koordinaten und Beobachtungen zu dem Punkt verwendet werden.

In der Vermessungsansicht erscheinen Punkte als Punkte, wobei alle Beobachtungen zwischen ihnen angezeigt werden. In der Planansicht werden Punkte entsprechend ihres Punktstils dargestellt. Die Datenbank läßt Punkte mit doppelten Namen zu.


Dialogfeld Punkte einfügen

Verwenden Sie dieses Dialogfeld, um Punkte in die Datenbank einzufügen. Die Felder ändern sich, abhängig davon, welche Option Sie im Feld Koordinatentyp wählen.

Führen Sie einen der folgenden Schritte durch, um darauf zuzugreifen:

  Wählen Sie in der Vermessungsansicht Einfügen / Punkte.

  Führen Sie in der Planansicht einen der folgenden Schritte durch:

  Wählen Sie Einfügen / Punkte.

  Klicken Sie auf das Symbol Punkte einfügen [image].

Einfügen

Klicken Sie auf Einfügen, um den Punkt in die Datenbank einzufügen. Das Dialogfeld bleibt verfügbar, so daß ein anderer (neuer) Punkt hinzugefügt werden kann.

HINWEIS: Wenn das erste Gitternetz oder die erste GPS-Position zu einem Projekt mit einer nicht definierten voreingestellten (Transversal-Mercator) Projektion hinzugefügt wird, zeigt Trimble Geomatics Office ein entsprechendes Dialogfeld an, um Ihnen bei der korrekten Initialisierung der Projektion zu assistieren.

Schließen

Klicken Sie auf Schließen, um das Einfügen von Punkten abzuschließen und das Dialogfeld zu verlassen.

Name

Geben Sie mit Hilfe der Tastatur einen Namen ein. Sie können einen Namen mit bis zu 16 Zeichen eingeben.

Sie können die folgenden Zeichen nicht in Namen verwenden:

  Geschweifte Klammern {}

  Eckige Klammern []

  Runde Klammern ()

  Prozentzeichen %

  Gleichheitszeichen =

  Anführungszeichen “ oder ' '

HINWEIS: Wenn Punkte nacheinander eingegeben werden, werden die Namen automatisch erhöht, wenn der zuvor eingegebene Punktname mit einer Zahl endet.

HINWEIS: Wenn Sie den Standardpunktnamen im Dialogfeld Projekteigenschaften einstellen möchten, wählen Sie das Register Einheiten und Format, und verwenden Sie das Feld Autom. Punktnamen beginnen mit.

Gruppe Koordinatendetails

Wählen Sie die entsprechende Qualität für jede Koordinatenkomponente (horizontal, Höhe). Diese Qualitäten werden bei der Neuberechnung verwendet, um die beste Position für den Punkt zu bestimmen.

Die Gruppe Koordinatendetails ändert sich, abhängig davon, ob Sie die Option WGS-84, Gitter oder Örtlich in diesem Dialogfeld gewählt haben. Jede der Koordinatendetailgruppen stellt eine andere Koordinatenansicht dar.

Wenn Sie die Option Gitter gewählt haben, erscheinen die folgenden Felder:

Hochwert	Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert über die Tastatur ein. Wenn Sie die graphische Auswahl verwenden, erscheint in den Feldern Hochwert und Rechtswert die Position, auf die Sie geklickt haben.
Rechtswert	Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert über die Tastatur ein. Wenn Sie die graphische Auswahl verwenden, erscheint in den Feldern Hochwert und Rechtswert die Position, auf die Sie geklickt haben.
Wenn Sie die Option WGS-84 oder Örtlich gewählt haben, und die Einstellung WGS-84 anzeigen als (im Register Einheiten und Format des Dialogfelds Projekteigenschaften) auf B,L,H eingestellt ist, erscheinen die folgenden Felder:

Breitengrad	Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert über die Tastatur ein. Wenn Sie die graphische Auswahl verwenden, erscheint in den Feldern Breitengrad und Längengrad die Position, auf die Sie geklickt haben.
Längengrad	Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert über die Tastatur ein. Wenn Sie die graphische Auswahl verwenden, erscheint in den Feldern Breitengrad und Längengrad die Position, auf die Sie geklickt haben.

Die folgenden Felder erscheinen zusammen mit jeder Option:

Höhe	Geben Sie einen Wert über die Tastatur ein, oder klicken Sie auf einen bestehenden Punkt. Wenn Sie auf einen bestehenden Punkt klicken, wird der orthometrische Höhenwert für diesen Punkt in das Feld Höhe eingetragen.
Ellips Höhe	Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert über die Tastatur ein. Wenn Sie auf einen bestehenden Punkt klicken, wird der ellipsoidische Höhenwert für diesen Punkt in das Feld Ellips Höhe eingetragen.
TIP: Um einen Punkt entlang einer Beobachtungslinie in der Vermessungsansicht oder alle Liniennetze in der Planansicht zu plazieren, halten Sie Strg gedrückt, während Sie die graphische Auswahl verwenden. Sie können die graphische Auswahl verwenden, um eine angenäherte Koordinate zu erhalten und diesen Wert daraufhin bearbeiten.

HINWEIS: Wenn die Einstellung WGS-84 anzeigen als im Register Einheiten und Format des Dialogfelds Projekteigenschaften auf X,Y,Z eingestellt ist, dann erscheinen die Felder X,Y,Z. Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert über die Tastatur ein. Wenn Sie die graphische Auswahl verwenden, erscheint die Position, auf die Sie geklickt haben, in den Feldern.

Koordinatentyp

Wählen Sie in diesem Feld die Option (WGS-84, Örtlich, Gitter), die Sie verwenden möchten, um die Koordinaten in der Datenbank zu speichern. Wenn ein Koordinatentyp gewählt wird, wird in der Koordinatenansicht ebenfalls die Einstellung für den Koordinatentyp verwendet.

HINWEIS: Wenn Sie die Felder in der Gruppe Koordinatendetails bearbeiten möchten, müssen der Koordinatentyp und die Koordinatenansicht identisch sein.

Gruppe CAD-Details

Diese Gruppe enthält alle Felder für einen Punkt, die in der Planansicht sichtbar sind.

Kartiercode

Geben Sie einen Wert über die Tastatur ein, oder klicken Sie auf einen bestehenden Punkt. Wenn Sie auf einen bestehenden Punkt klicken, wird der Kartiercodewert für diesen Punkt in das Feld Kartiercode eingetragen.

Beschreibung

Geben Sie einen Wert über die Tastatur ein, oder klicken Sie auf einen bestehenden Punkt. Wenn Sie auf einen bestehenden Punkt klicken, wird der Beschreibungswert für diesen Punkt in das Feld Beschreibung eingetragen.

Layer

Führen Sie einen der folgenden Schritte durch:

  Wählen Sie einen bestehenden Layer von der Liste.

  Geben Sie einen neuen Layer über die Tastatur ein. Das Dialogfeld Neuer Layer erscheint.

  Klicken Sie auf einen bestehenden Punkt. Wenn Sie auf einen bestehenden Punkt klicken, wird der Layer-Wert für diesen Punkt in das Feld Layer eingetragen.

Punktstil

Führen Sie einen der folgenden Schritte durch:

  Wählen Sie einen bestehenden Punktstil von der Liste.

  Geben Sie einen neuen Punktstil über die Tastatur ein. Das Dialogfeld Punktstil erzeugen erscheint.

  Klicken Sie auf einen bestehenden Punkt. Wenn Sie auf einen bestehenden Punkt klicken, wird der Punktstilwert für diesen Punkt in das Feld Punktstil eingetragen.


Befehl Punkte nach Azimut und Strecke einfügen

Verwenden Sie diesen Befehl, um Punkte nach Azimut und Strecke von einem bekannten Punkt einzufügen.

Wählen Sie hierzu Einfügen / Punkte nach Azimut und Strecke.

Das Dialogfeld Punkte nach Azimut und Strecke einfügen erscheint.


Dialogfeld Punkte nach Azimut und Strecke einfügen

Verwenden Sie dieses Dialogfeld, um Punkte nach Azimut und Strecke von einem bekannten Punkt einzufügen.

Führen Sie einen der folgenden Schritte durch, um darauf zuzugreifen:

  Wählen Sie Einfügen / Punkte nach Azimut und Strecke.

  Klicken Sie auf das Symbol Punkte nach Azimut und Strecke einfügen [image] in der Planansicht.

HINWEIS: Die Qualitäten für den neuen Punkt sind dieselben wie die des „Von“-Punkts. Wenn kein Höhenunterschied angegeben ist, bleiben die Felder für die ellipsoidische und orthometrische Höhe für den neuen Punkt unbekannt.

Punktname

Geben Sie einen Punktnamen über die Tastatur ein. Sie können einen Namen mit bis zu 16 Zeichen eingeben.

Sie können die folgenden Zeichen nicht in Namen verwenden:

  Geschweifte Klammern {}

  Eckige Klammern []

  Runde Klammern ()

  Prozentzeichen %

  Gleichheitszeichen =

  Anführungszeichen " " oder ‘

Von Punkt

Geben Sie einen bestehenden Punktnamen über die Tastatur ein, oder klicken Sie auf einen bestehenden Punkt.

Azimut

Dieses Feld ist von der Einstellung im Feld Azimuttyp abhängig. Geben Sie einen Azimut-Wert in dem Winkelformat (Grad) ein, das im Register Einheiten und Format festgelegt wurde.

Strecke

Dieses Feld ist von der Einstellung im Feld Strecke anzeigen als im Register Einheiten und Format im Dialogfeld Projekteigenschaften abhängig. Wenn Sie keine Einheit angeben, werden die aktuellen Einheiten für das Projekt verwendet; Sie können jedoch m, ift (Internationale Fuß) oder sft (US-Vermessungs-Fuß) angeben.

Höhenunterschied

Dieser Wert wird zu der orthometrischen Höhe des "Von"-Punkts hinzugefügt, um eine Höhe für den neuen Punkt abzuleiten. Eine positive Änderung bedeutet, daß der neue Punkt eine größere Höhe besitzt als der Startpunkt. Geben Sie eine negative Zahl ein, wenn der neue Punkt eine geringere Höhe hat als der Startpunkt. Wenn Sie keine Einheit angeben, werden die aktuellen Einheiten für das Projekt verwendet; Sie können jedoch m, ift (Internationale Fuß) oder sft (US-Vermessungs-Fuß) angeben. Wenn Sie keinen Höhenunterschied bestimmen, beträgt die Höhe des neuen Punkts Null.

Azimuttyp

Verwenden Sie diese Gruppe, um den Gitter- oder ellipsoidischen Azimut vorwärts zu wählen.

 Gitter −  wählen Sie diese Option, um den Gitternetz-Azimut anzuzeigen

 Ellipsoidisch vorw −  wählen Sie diese Option, um den ellipsoidischen Azimut vorwärts anzuzeigen

Methode

Verwenden Sie diese Gruppe, um zu wählen, wie die Software das Dialogfeld vorbereitet, nachdem ein Punkt eingefügt wurde.

  Sequentiell  −  Wenn ein neuer Punkt hinzugefügt wird, fügt diese Option den Namen des neuen Punktes in das Feld Von Punkt ein. Verwenden Sie diese Option, um einen Polygonzug einzugeben.

  Radial −  Behält den Von Punkt-Namen bei. Verwenden Sie diese Option, um vom gleichen Startpunkt ausgehende Polarpunkte zu bestimmen.

Verbinden

Verwenden Sie dieses Kontrollkästchen, um  eine Linie zwischen dem "Von"-Punkt und dem neuen Punkt zu zeichnen. Die Linie wird zu dem aktuellen Layer hinzugefügt und in dem voreingestellten Linienstil für den aktuellen Layer gezeichnet. Sie können diese Linie nur in der Planansicht sehen.


Dialogfeld Azimut einfügen

Ein Azimut wird zur Orientierung terrestrischer Beobachtungen verwendet. Verwenden Sie dieses Dialogfeld, um einen Azimut zwischen zwei Punkten einzufügen.

So greifen Sie auf darauf zu:

  Wählen Sie in der Vermessungsansicht Einfügen / Azimut.

Von Punkt und Zu Punkt

Verwenden Sie die Tastatur oder die graphische Auswahl, um den Namen eines bestehenden Punkts in diese Felder einzugeben.

Azimut

Wenn bestehende “Zu”-Punkte und “Von”-Punkte eingegeben werden, wird ein berechneter Azimutwert angezeigt. Sie können diesen Wert oder die Azimut-Qualität ändern, falls erforderlich. Der in diesem Feld angezeigte Azimut ist abhängig von der Einstellung in den nachstehenden Feldern für die Azimutanzeige.

Wenn bereits ein Azimut für ein Punktepaar existiert, werden Sie gefragt, ob Sie es überschreiben möchten.

Azimuttyp

Verwenden Sie dieses Feld, um festzulegen, wie der Azimut in der Datenbank gespeichert werden soll: als Gitternetz-Azimut oder als ellipsoidischer Azimut vorwärts.

Gitter/Ellipsoidisch vorw.

Wählen Sie eine dieser Optionen, um festzulegen, wie Koordinaten im Dialogfeld Azimut einfügen angezeigt werden sollen (die Azimutanzeige).

HINWEIS: Der Azimuttyp und die Azimutanzeige müssen identisch sein, damit die Felder in diesem Dialogfeld bearbeitet werden können.

HINWEIS: Wenn der “Zu”-Punkt keine Koordinate hat, kann zwischen dem Gitternetz-Azimut und dem ellipsoidischen Azimut vorwärts nicht konvertiert werden, und der Azimut wird als Null angezeigt.

Einfügen

Verwenden Sie diese Schaltfläche, um den Azimut in das Projekt einzufügen. Der Azimut wird zwischen den beiden definierenden Punkten angezeigt; ein Pfeil gibt die Richtung an.

Schließen

Verwenden Sie diese Schaltfläche, um das Dialogfeld zu schließen.


    Befehl Linien

Verwenden Sie diesen Befehl, um Linien in die Datenbank einzufügen.

So greifen Sie darauf zu:

  Wählen Sie Einfügen / Linien.

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Linie ist gewählt.


    Dialogfeld Liniennetz einfügen

Verwenden Sie dieses Dialogfeld, um neue Liniennetze (Linien, Kurven oder Bögen) in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um darauf zuzugreifen:

Linien	Wählen Sie das Symbol Linien einfügen [image].   Wählen Sie Einfügen / Linien.
Kurven	Wählen Sie das Symbol Kurven einfügen [image].    Wählen Sie Einfügen / Kurven.
Bogen	Wählen Sie das Symbol Bogen einfügen [image].    Wählen Sie Einfügen / Bogen.

Das Dialogfeld Liniennetz einfügen erscheint. Das entsprechende Register ist gewählt.

Verwenden Sie die graphische Auswahl, oder geben Sie die Details mit der Tastatur ein, um das Dialogfeld zu vervollständigen. Um Liniennetze schnell hinzuzufügen, doppelklicken Sie auf die graphische Auswahl, während Sie sich im Feld Zu Punkt befinden.

Sie können den Linientyp jederzeit ändern. In diesem Fall ist es möglich, Abfolgen von Linien, Kurven, Bögen oder beliebige Kombinationen zu verbinden.

Sie können drei Liniennetz-Typen zu der Datenbank hinzufügen:

  Linien

  Bogen

  Kurven

Einfügen

Klicken Sie auf Einfügen, um das Liniennetz zu dem Projekt hinzuzufügen, und lassen Sie das Dialogfeld geöffnet, um neue Liniennetze hinzuzufügen.

Der Wert des “Von“-Punktes wird zum Wert des “Zu“-Punktes, der für die nächste Linie bereitsteht.


Linien - Überblick
    Linien − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Sie können in Trimble Geomatics Office Linien zwischen Punkten einfügen. Fügen Sie Linien in Ihr Projekt ein, um Linienbegrenzungen (z. B. Zaunlinien, Gebäude und Pipelines) zu definieren.

Linien erscheinen im Graphikfenster, wenn Sie Ihr Projekt in der Planansicht ansehen. Wählen Sie die Linie, und öffnen Sie das Eigenschaftsfenster, um die Eigenschaften der Linie anzusehen.

Linien werden entsprechend ihres Linienstils angezeigt. Sie können die Trimble Linienstile verwenden oder Ihren eigenen Linienstil erzeugen.

Linien können in verschiedene Formate exportiert werden (z. B. die AutoCAD- und TRIMMAP-Formate).


Bogen - Überblick
    Bogen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Sie können Bögen erzeugen, um glatte, kreisförmige Bögen zwischen Punkten anzuzeigen.

Bögen erscheinen im Graphikfenster, wenn Sie Ihr Projekt in der Planansicht ansehen. Wählen Sie den Bogen, und öffnen Sie das Eigenschaftsfenster, um die Eigenschaften des Bogens anzusehen.

Bögen werden entsprechend ihres Linienstils angezeigt. Sie können die Trimble-Linienstile verwenden oder Ihren eigenen Linienstil erzeugen.

Bögen können in verschiedene Formate exportiert werden (z. B. die AutoCAD- und TRIMMAP-Formate).


Kurven - Überblick
    Kurven − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Fügen Sie Kurven ein, um bestmögliche Kurvenanpassungen zwischen Punkten zu erhalten. Verwenden Sie Kurven, um Begrenzungen zu definieren, die keine geraden Linien sind (z. B. Wasserläufe oder Pfade).

Kurven erscheinen im Graphikfenster, wenn Sie Ihr Projekt in der Planansicht ansehen.

Kurven werden entsprechend ihres Linienstils angezeigt. Sie können die Trimble Linienstile verwenden oder Ihren eigenen Linienstil erzeugen.

Jedesmal, wenn Sie eine Kurve an einem Punkt einfügen, der in einer anderen Kurve verwendet wird, berechnet Trimble Geomatics Office die bestehende Kurve erneut, um sicherzustellen, daß eine glatte Kurve angezeigt wird.

Kurven können in verschiedene Formate exportiert werden (z. B. die AutoCAD- und TRIMMAP-Formate).


Dialogfeld Liniennetz einfügen - Register Linie
    Dialogfeld Liniennetz einfügen − Register Linie

Verwenden Sie dieses Dialogfeld, um Linien in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Linien.

  Wählen Sie das Symbol Linien einfügen [image].

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Linie ist gewählt.

Von Punkt

Führen Sie einen der folgenden Schritte durch:

  Verwenden Sie die graphische Auswahl, um den ersten Punkt zu wählen, den Sie zur Definition der Linie verwenden möchten.

  Geben Sie den Punktnamen des ersten Punkts ein, den Sie zur Definition der Linie verwenden möchten.

Zu Punkt

Führen Sie einen der folgenden Schritte durch:

  Verwenden Sie die graphische Auswahl, um den zweiten Punkt zu wählen, den Sie zur Definition der Linie verwenden möchten.

  Geben Sie den Punktnamen des zweiten Punkts ein, den Sie zur Definition der Linie verwenden möchten.

Layer

Führen Sie einen der folgenden Schritte durch:

  Wählen Sie den Layer, zu dem Sie die Linie hinzufügen möchten.

  Geben Sie einen neuen Layer-Namen ein, um einen neuen Layer zu erzeugen. Das Dialogfeld Neuer Layer erscheint.

Linienstil

Wählen Sie den Linienstil, den Sie verwenden möchten, um die Linie anzuzeigen. Die verfügbaren Stile sind die Linienstile im Dialogfeld CAD-Stile.

Einfügen

Klicken Sie auf Einfügen, um eine Linie einzufügen. Der im Feld Zu Punkt gewählte Punkt wird gemäß Voreinstellung im Feld Von Punkt gewählt. Sie können dies ändern, falls erforderlich.

Schließen

Klicken Sie auf Schließen, um das Einfügen von Linien zu beenden.


    Befehl Bogen

Verwenden Sie diesen Befehl, um Bögen in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Bogen.

  Wählen Sie das Symbol Bogen einfügen [image].

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Bogen ist gewählt.


Dialogfeld Liniennetz einfügen - Register Bogen
    Dialogfeld Liniennetz einfügen − Register Bogen

Verwenden Sie dieses Dialogfeld, um Bögen in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Bogen.

  Wählen Sie das Symbol Bogen einfügen [image].

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Bogen ist gewählt.

Von Punkt

Führen Sie einen der folgenden Schritte durch:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf den entsprechenden Punkt.

  Verwenden Sie die Tastatur, um den Punktnamen einzugeben.

Zu Punkt

Führen Sie einen der folgenden Schritte durch:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf den entsprechenden Punkt.

  Verwenden Sie die Tastatur, um den Punktnamen einzugeben.

Mittelpunkt

Führen Sie einen der folgenden Schritte durch, um einen bestehenden Punkt als Bogenmitte zu verwenden:

  Geben Sie einen bestehenden Punktnamen ein.

  Verwenden Sie die graphische Auswahl, um einen bestehenden Punkt zu wählen.

Die Koordinaten für den Punkt werden in die Felder Hochwert und Rechtswert kopiert.

Hochwert, Rechtswert

Verwenden Sie die graphische Auswahl, um auf eine Stelle im Graphikfenster zu klicken, und Koordinaten als Bogenmitte zu verwenden. Die Koordinaten werden in diese Felder kopiert.

HINWEIS: Wenn Sie sowohl einen Mittelpunkt als auch Mittelpunkt-Koordinaten eingeben, wird der Mittelpunkt verwendet.

Kleiner Bogen

Wählen Sie die Option Wahr, wenn Sie einen kleinen Bogen erzeugen möchten. Andernfalls wählen Sie Falsch. Es gibt zwischen zwei Punkten immer zwei mögliche Bögen, die zusammen einen Kreis definieren. Diese Einstellung definiert, welchen Bogen Sie zeichnen möchten. Dies wird in der folgenden Abbildung erläutert:

HINWEIS: Die Bogenmitte ist entweder eine gerade Linie zwischen den beiden Punkten oder die Koordinaten in den Feldern Hochwert und Rechtswert.

Layer

Führen Sie einen der folgenden Schritte durch:

  Wählen Sie den Layer, zu dem Sie den Bogen hinzufügen möchten.

  Geben Sie einen neuen Layer-Namen ein, um einen neuen Layer zu erzeugen. Das Dialogfeld Neuer Layer erscheint.

Linienstil

Wählen Sie den Linienstil, den Sie verwenden möchten, um den Bogen anzuzeigen. Die verfügbaren Stile sind die Bogenstile im Dialogfeld CAD-Stile.

Einfügen

Klicken Sie auf Einfügen, um den Bogen einzufügen. Der im Feld Zu Punkt gewählte Punkt wird gemäß Voreinstellung im Feld Von Punkt gewählt. Sie können dies ändern, falls erforderlich.

Schließen

Klicken Sie auf Schließen, um das Einfügen von Bögen zu beenden.


    Befehl Kurven

Verwenden Sie diesen Befehl, um Kurven in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Kurven.

  Wählen Sie das Symbol Kurven einfügen [image].

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Kurve ist gewählt.


Dialogfeld Liniennetz einfügen - Register Kurve
    Dialogfeld Liniennetz einfügen − Register Kurve

Verwenden Sie dieses Dialogfeld, um Kurven in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Kurven.

  Wählen Sie das Symbol Kurven einfügen

Das Dialogfeld Liniennetz einfügen erscheint. Das Register Kurve ist gewählt.

Von Punkt

Führen Sie einen der folgenden Schritte durch:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf die entsprechenden Punkte.

  Verwenden Sie die Tastatur, um den/die Punktnamen einzugeben.

Zu Punkt

Führen Sie einen der folgenden Schritte durch:

  Verwenden Sie die graphische Auswahl, und klicken Sie auf die entsprechenden Punkte.

  Verwenden Sie die Tastatur, um den/die Punktnamen einzugeben.

Eingangstangente, Ausgangstangente

Wenn die Tangentenwerte, die auf den Punkten basieren, die Definition der Kurve verwendet wurden, automatisch eingegeben werden sollen, belassen Sie die Werte auf <Automatisch>. Sie können Ihre eigenen Tangentenwerte eingeben, falls erforderlich.

Rundung

Geben Sie einen Wert zwischen 0 und 1 ein. Die Rundung definiert die Krümmung der Kurve.

Je höher die Rundung, desto größer die Krümmung der Kurve.

Layer

Führen Sie einen der folgenden Schritte durch:

  Wählen Sie den Layer, zu dem Sie die Kurve hinzufügen möchten.

  Geben Sie einen neuen Layer-Namen ein, um einen neuen Layer zu erzeugen. Das Dialogfeld Neuer Layer erscheint.

Linienstil

Wählen Sie den Linienstil, den Sie verwenden möchten, um die Kurve anzuzeigen. Die verfügbaren Stile sind die Linienstile im Dialogfeld CAD-Stile.

Einfügen

Klicken Sie auf Einfügen, um die Kurve einzufügen. Der im Feld Zu Punkt gewählte Punkt wird gemäß Voreinstellung im Feld Von Punkt gewählt. Sie können dies ändern, falls erforderlich.

Schließen

Klicken Sie auf Schließen, um das Einfügen von Kurven zu beenden.


    Befehl Text

Verwenden Sie diesen Befehl, um das Dialogfeld Text einfügen zu öffnen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Text.

  Wählen Sie das Symbol Text einfügen [image].


    Dialogfeld Text einfügen

Verwenden Sie dieses Dialogfeld, um neuen Text in die Datenbank einzufügen.

Führen Sie einen der folgenden Schritte durch, um von der Planansicht darauf zuzugreifen:

  Wählen Sie Einfügen / Text.

  Wählen Sie das Symbol Text einfügen [image].

Textausdruck

Geben Sie den Text ein, der erscheinen soll. Wenn Sie Feldcodes (z. B. den Projekttitel) verwenden möchten, klicken Sie mit der rechten Maustaste darauf, und wählen Sie Felder vom Verknüpfungsmenü.

Hochwert

Führen Sie einen der folgenden Schritte durch, um den Hochwert für die Textposition einzugeben:

  Verwenden Sie die graphische Auswahl, indem Sie auf eine Stelle in dem Graphikfenster klicken.

  Geben Sie den Hochwert über die Tastatur ein.

Rechtswert

Führen Sie einen der folgenden Schritte durch, um den Rechtswert für die Textposition einzugeben:

  Verwenden Sie die graphische Auswahl, indem Sie auf eine Stelle in dem Graphikfenster klicken.

 Geben Sie den Rechtswert über die Tastatur ein.

Orientierung

Geben Sie eine Orientierung für das Textelement ein. Wenn Sie keine Orientierung eingeben, wird der Text horizontal über das Fenster hinweg angezeigt.

Verankerungstyp

Legen Sie fest, wo sich der Text im Hinblick auf die Hochwerte und Rechtswerte befindet. Wählen Sie einen Wert von der Liste.

Layer

Wählen Sie den Layer, zu dem Sie Text aus der Liste hinzufügen möchten. Um Text in einen neuen Layer einzugeben, geben Sie einen neuen Namen ein. Das Dialogfeld Neuer Layer erscheint.

Textstil

Wählen Sie den Textstil für das Textelement aus der Liste. Wenn Sie den voreingestellten Textstil für den Layer, zu dem Sie Text hinzufügen, verwenden möchten, wählen Sie die Option <Nach Layer>.

Wählen Sie Bearbeiten / Stile, um Textstile zu bearbeiten und zu erzeugen.

Einfügen

Klicken Sie auf Einfügen, um den Text zu dem Projekt hinzuzufügen, und lassen Sie das Dialogfeld geöffnet, um weiteren Text einzufügen.


Text - Überblick
Text  − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Sie können Text zu einem Projekt hinzufügen. Fügen Sie z. B. Text hinzu, um Abbildungen zu beschreiben oder um Projektinformationen anzuzeigen.

Der Text erscheint im Graphikfenster. Wählen Sie den Text, und öffnen Sie das Eigenschaftsfenster, um die Eigenschaften des Texts anzusehen. Sie können Text auch zu einer neuen Position im Graphikfenster ziehen oder den Text rotieren.

Text wird in verschiedene Formate exportiert (z. B. die AutoCAD- und TRIMMAP-Formate).


Anmerkungen - Überblick
    Anmerkungen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Anmerkungen sind Texte, die mit Elementen (Punkten, Linien und Bögen) verknüpft sind. Der angezeigte Text ist durch ein Anmerkungsmuster definiert.

Anmerkungsmuster definieren:

  was angemerkt wird

  die Position der Anmerkung im Bezug auf das Element

Anmerkungsmuster können Kombinationen von benutzerdefiniertem Text und Feldcodes enthalten. Feldcodes werden jedesmal expandiert, wenn sich das anzumerkende Feld ändert. Wenn z. B. ein Punkt mit seiner orthometrischen Höhe angemerkt wird, und sich die Punkthöhe ändert, wird die Anmerkung aktualisiert.

Anmerkungen werden im Projekt gespeichert.

Anmerkungsmuster

Trimble stellt einige vordefinierte Anmerkungsmuster zur Verfügung. Wenn Sie Kartiercodes verarbeiten, und die Merkmals- und Attributbibliothek Anmerkungsmuster enthält, werden diese zur Anmerkungsmusterliste hinzugefügt. Da die Anmerkungsmuster der Merkmals- und Attributbibliothek keine Textstil-Einstellungen haben, wird gemäß Voreinstellung der Standard-Textstil verwendet, wenn die Anmerkungsmuster zum Trimble Geomatics Office-Projekt hinzugefügt werden.

Anmerkungen hinzufügen

Führen Sie einen der folgenden Schritte durch, um Anmerkungen von der Planansicht hinzuzufügen:

  Wählen Sie Einfügen / Anmerkungen

  Wählen Sie Bearbeiten / Anmerkungsmuster. Klicken Sie auf Neu.

  Verwenden Sie die Kartiercode-Verarbeitung, um Elemente anzumerken. Weitere Informationen finden Sie in der Hilfe des Trimble Feature and Attribute Editor-Programms.

HINWEIS: Verwenden Sie das Eigenschaftsfenster, um bestehende Anmerkungen zu bearbeiten.


    Befehl Anmerkungen

Verwenden Sie diesen Befehl, um Anmerkungen zu den ausgewählten Punkten, Linien oder Bögen hinzuzufügen.

Wählen Sie hierzu Einfügen / Anmerkungen.

Das Dialogfeld Anmerken erscheint.


    Dialogfeld Anmerken

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um die gewählten Punkte, Linien oder Bögen anzumerken.

Wählen Sie hierzu Einfügen / Anmerkungen.

Die Einfügeposition für Anmerkungen von Elementen auf Papier wird im Bezug auf die Elementdimension und den Plot-Maßstab festgelegt. Diese werden mit Datei / Dialogfeld Blatt konfigurieren bestimmt. Ein Zwischenraum von einem Drittel der Zeichenhöhe wird zwischen der Anmerkung und dem angemerkten Element hinzugefügt.

Anmerkungsmuster

Wählen Sie ein Muster aus der Liste.

Bestehende Anmerkungen beibehalten

Wählen Sie dieses Kontrollkästchen, um bestehende Anmerkungen beizubehalten, die den anzumerkenden Elementen zugeordnet wurden. Die neuen Anmerkungen werden zusätzlich zu den bestehenden Anmerkungen hinzugefügt, selbst wenn sie sich an derselben Stelle befinden.

TIP: Sie können diese Funktion verwenden, um mehrere Anmerkungen für Elemente, die in unterschiedliche Layer unterteilt wurden, im Dialogfeld Anmerkungsmuster zur Verfügung zu stellen.

Wenn Sie dieses Kontrollkästchen deaktivieren, werden Anmerkungen, die den anzumerkenden Elementen zugeordnet wurden, aus der Datenbank entfernt, bevor die neue Anmerkung hinzugefügt wird.

Anmerken

Es gibt zwei Methoden, Elemente anzumerken:

Auswahl	Wählen Sie diese Option, um Anmerkungen zu den ausgewählten Elementen hinzuzufügen.
Ganze Datenbank	Wählen Sie diese Option, um Anmerkungen zu allen Elementen hinzuzufügen.
Diese Schaltflächen sind nicht verfügbar, wenn keine Auswahl getroffen wurde. In diesem Fall werden alle Elemente angemerkt.

Entfernen

Führen Sie einen der folgenden Schritte durch, um alle Anmerkungen von ausgewählten Elementen zu entfernen:

  Klicken Sie auf Entfernen.

  Wählen Sie die Anmerkungen, und wählen Sie Bearbeiten / Löschen.

Muster

Klicken Sie auf Muster, um das Dialogfeld Anmerkungsmuster einzublenden. Verwenden Sie dieses Dialogfeld, um die Anmerkungsmuster auszuwählen, die Sie erzeugen, ändern oder löschen möchten. Weitere Informationen finden Sie unter Dialogfeld Anmerkungsmuster.


    Dialogfeld Anmerkungsmuster

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um Anmerkungsmuster zu verwalten.

So greifen Sie darauf zu:

1.	Wählen Sie Einfügen / Anmerkungen.

2.	Klicken Sie auf Muster.

Ein Anmerkungsmuster definiert Stil, Position und Inhalt einer oder mehrerer Anmerkungen. Entsprechend der Zuordnung ist jede Anmerkung ein gesondertes, vom Anmerkungsmuster unabhängiges Stück Textinformation. Anmerkungen werden im Projekt gespeichert.

Trimble Geomatics Office verwendet Feldcodes, um die Werte zu spezifizieren, die in der Anmerkung angezeigt werden. Eine Anmerkung ist dynamisch—jeder Feldcode wird immer dann erneut expandiert, wenn sich das übergeordnete Element ändert.

Anmerkungsmuster

Diese Liste enthält alle Anmerkungsmuster, die sich gerade im Projekt befinden.

Heben Sie den entsprechenden Musternamen hervor, um ein bestehendes Anmerkungsmuster zu bearbeiten oder zu löschen.

Neu

Klicken Sie auf Neu, um ein neues Anmerkungsmuster zu erzeugen. Das Dialogfeld Anmerkungsmuster erscheint.

Bearbeiten

Klicken Sie auf Bearbeiten, um ein bestehendes Anmerkungsmuster zu modifizieren. Das Dialogfeld Anmerkungsmuster erscheint.

Löschen

Klicken Sie auf Löschen, um das gewählte Anmerkungsmuster zu löschen. Es wird aus dem Projekt gelöscht.


    Dialogfeld Anmerkungsmuster

 Überblick und weitere Informationen

Verwenden Sie die Register in diesem Dialogfeld, um das gerade erzeugte oder bearbeitete Anmerkungsmuster zu konfigurieren.

So greifen Sie darauf zu:

1.	Führen Sie einen der folgenden Schritte durch:

  Wählen Sie Einfügen / Anmerkungen. Klicken Sie auf Muster.

  Wählen Sie Bearbeiten / Anmerkungsmuster.

Das Dialogfeld Anmerkungsmuster erscheint.

2.	Klicken Sie auf Neu oder auf Bearbeiten.

Verwenden Sie diese vier Register, um das Anmerkungsmuster zu definieren:

  Einstellungen

  Punkte

  Linien

  Bogen


Dialogfeld Anmerkungsmuster - Register Einstellungen
    Dialogfeld Anmerkungsmuster − Register Einstellungen

 Überblick und weitere Informationen

Verwenden Sie das Register Einstellungen, um die allgemeinen Einstellungen für das Anmerkungsmuster zu bearbeiten.

So greifen Sie darauf zu:

1.	Wählen Sie Einfügen / Anmerkungen.

2.	Klicken Sie auf Muster.

3.	Klicken Sie auf Neu oder auf Bearbeiten.

4.	Wählen Sie das Register Einstellungen.

Name

Geben Sie einen Namen ein, um den Namen des aktuellen Musters anzusehen oder umzubenennen.

Textstil

Definieren Sie den Textstil für die Anmerkung.

Wählen Sie Bearbeiten / Stile in der Planansicht, um Textstile für die Anmerkung zu definieren. Wenn Sie die Option <Nach Layer> wählen, wird der Textstil von der Textstileinstellung für den Layer übernommen, zu dem die Anmerkung hinzugefügt wird.

Wählen Sie Bearbeiten / Layer in der Planansicht, um Layer-Voreinstellungen festzulegen.

Orient. für Punkt-Anmerkungen

Geben Sie die benötigte Orientierung für Punkt-Anmerkungen ein. Sie können jede Orientierung von 00°00'00" bis 360°00'00" verwenden. Die Voreinstellung ist 90°00'00".

Layer

Plazieren in	Verwenden Sie diese Option, um die Anmerkungen in einem bestimmten Layer zu plazieren. Sie können entweder von der Liste bestehender Layer auswählen oder einen neuen Layer-Namen eingeben. Wenn Sie einen neuen Layer-Namen eingeben, wird dieser Layer automatisch erzeugt, wenn das Muster angewendet wird.

In aktuellem Layer plazieren

Verwenden Sie diese Option, um die Anmerkungen im aktuellen Layer zu plazieren. Der aktuelle Layer wird in dem Symbol Layer-Auswahl in der Planansicht und im Dialogfeld Layer angezeigt.

Im Layer des angemerkten Elements plazieren

Verwenden Sie diese Option, um Anmerkungen in dem Layer des angemerkten Elements zu plazieren.


Dialogfeld Anmerkungsmuster - Register Punkte
    Dialogfeld Anmerkungsmuster − Register Punkte

 Überblick und weitere Informationen

Verwenden Sie das Register Punkte, um Anmerkungen für Punkte zu definieren, wenn Punkte unter Verwendung dieses Musters angemerkt werden.

So greifen Sie darauf zu:

1.	Wählen Sie Einfügen / Anmerkungen.

2.	Klicken Sie auf Muster.

3.	Klicken Sie auf Neu oder auf Bearbeiten.

4.	Wählen Sie das Register Punkte.

Der Anmerkungstext in jeder der vier Positionen (Links, Auf, Rechts, Frei) kann maximal 100 alphanumerische Zeichen enthalten. Die Werte in jeder Position können aus benutzerdefiniertem Text und Feldcodes bestehen. Die Feldcodes werden verwendet, um Anmerkungsdetails aus der Datenbank zu entnehmen. Der Feldcode ‘[Name]’ wird z. B. verwendet, um einen Punkt mit seinem Namen anzumerken—in diesem Fall rechts des Punktes.

Sie können einen Punkt mit einer beliebigen Kombination von vier voreingestellten Positionen anmerken. Wenn Sie eine Anmerkung von einer voreingestellten Position verschieben möchten, verwenden Sie die Maus, um die Anmerkung zu einer günstigeren Stelle zu ziehen. Die Anmerkung ist immer noch mit dem Punkt verknüpft.

Ort	Die Anmerkung erscheint:

Links	links des Punktes.

Auf	auf dem Punkt.

Rechts	rechts des Punktes.

Frei	in einer von dem Punkt entfernten Position, aber mit dem Punkt verknüpft.


Dialogfeld Anmerkungsmuster - Register Linien
    Dialogfeld Anmerkungsmuster − Register Linien

Verwenden Sie das Register Linien, um Anmerkungen für Linien zu definieren, wenn Linien unter Verwendung dieses Musters angemerkt werden.

So greifen Sie darauf zu:

1.	Wählen Sie Einfügen / Anmerkungen.

2.	Klicken Sie auf Muster.

3.	Klicken Sie auf Neu oder auf Bearbeiten.

4.	Wählen Sie das Register Linien.

Der Anmerkungstext in jeder der sieben Positionen (siehe unten) kann maximal 100 alphanumerische Zeichen enthalten. Die Werte in jeder Position können aus benutzerdefiniertem Text und Feldcodes bestehen. Die Feldcodes werden verwendet, um Anmerkungsdetails aus der Datenbank zu entnehmen. Der Feldcode ‘[Azimut]’ wird z. B. verwendet, um eine Linie mit ihrem Azimut-Wert (in diesem Fall oberhalb der Linienmitte) anzumerken. Der Feldcode ‘[Strecke]’ wird verwendet, um eine Linie mit ihrem Streckenwert (in diesem Fall unterhalb der Linienmitte) anzumerken.

Sie können eine Linie mit einer beliebigen Kombination von sieben voreingestellten Positionen anmerken. Wenn Sie eine Anmerkung von einer voreingestellten Position verschieben möchten, verwenden Sie die Maus, um die Anmerkung zu einem günstigeren Ort zu ziehen. Die Anmerkung ist immer noch mit der Linie verknüpft.

Ort	Die Anmerkung erscheint:

Darüber links	oberhalb und am linken Ende der Linie.

Darüber Mitte	oberhalb und in der Mitte der Linie.

Darüber rechts	oberhalb und am rechten Ende der Linie.

Darunter links	unterhalb und am linken Ende der Linie.

Darunter Mitte	unterhalb und in der Mitte der Linie.

Darunter rechts	unterhalb und am rechten Ende der Linie.

Frei	in einer von der Linie entfernten, aber mit der Linie verknüpften Position.


Dialogfeld Anmerkungsmuster - Register Bogen
    Dialogfeld Anmerkungsmuster − Register Bogen

Verwenden Sie das Register Bogen, um Anmerkungen für Bögen zu definieren, wenn Bögen unter Verwendung dieses Musters angemerkt werden.

So greifen Sie darauf zu:

1.	Wählen Sie Einfügen / Anmerkungen.

2.	Klicken Sie auf Muster.

3.	Klicken Sie auf Neu oder auf Bearbeiten.

4.	Wählen Sie das Register Bogen.

Der Anmerkungstext in jeder der sieben Positionen (siehe unten) kann maximal 100 alphanumerische Zeichen enthalten. Die Werte in jeder Position können aus benutzerdefiniertem Text und Feldcodes bestehen. Die Feldcodes werden verwendet, um Anmerkungsdetails aus der Datenbank zu entnehmen. Der Feldcode ‘[Länge]’ wird z. B. verwendet, um einen Bogen mit seinem Längenwert (in diesem Fall oberhalb der Bogenmitte) anzumerken. Der Feldcode ‘[Radius]’ wird verwendet, um einen Bogen mit seinem Radiuswert (in diesem Fall unterhalb der Bogenmitte) anzumerken.

Sie können einen Bogen mit einer beliebigen Kombination von sieben voreingestellten Positionen anmerken. Wenn Sie eine Anmerkung von einer voreingestellten Position verschieben möchten, verwenden Sie die Maus, um die Anmerkung zu einem günstigeren Ort zu ziehen. Die Anmerkung ist immer noch mit dem Bogen verknüpft.

Ort	Die Anmerkung erscheint:

Darüber links	oberhalb und am linken Ende des Bogens.

Darüber Mitte	oberhalb und in der Mitte des Bogens.

Darüber rechts	oberhalb und am rechten Ende des Bogens.

Darunter links	unterhalb und am linken Ende des Bogens.

Darunter Mitte	unterhalb und in der Mitte des Bogens.

Darunter rechts	unterhalb und am rechten Ende des Bogens.

Frei	in einer vom Bogen entfernten, aber mit dem Bogen verknüpften Position.


Befehl Punkte

Verwenden Sie diesen Befehl, um neue Punkte in die Datenbank einzufügen.

Wählen Sie hierzu Einfügen / Punkte.

Das Dialogfeld Punkte einfügen erscheint.


Elemente zu dem Projekt hinzufügen

Sie können in Trimble Geomatics Office Elemente zum Projekt hinzufügen. Ein Element wird als Punkt, Linie, Bogen, Kurve, Anmerkung oder Text definiert. Sie können alle diese Elementtypen mit Hilfe des Menüs Einfügen in der Planansicht hinzufügen. Sie können Punkte zudem mit Hilfe des Menüs Einfügen in der Vermessungsansicht hinzufügen.

Information über die einzelnen Elementtypen erhalten Sie unter folgenden Verknüpfungen:

  Punkte

  Linien

  Bogen

  Anmerkungen

  Text


 Befehl Liniennetz für aktuelle Beobachtungen

Verwenden Sie diesen Befehl, um CAD-Liniennetze für gewählte Beobachtungstypen zu erzeugen.

Wählen Sie Einfügen / Liniennetz für aktuelle Beobachtungen, um von der Planansicht darauf zuzugreifen.

Das Dialogfeld Liniennetz für aktuelle Beobachtungen einfügen erscheint.


 Dialogfeld Liniennetz für aktuelle Beobachtungen einfügen

Verwenden Sie dieses Dialogfeld, um CAD-Linien für alle Beobachtungen in dem Projekt zu erzeugen.

Wählen Sie Einfügen / Liniennetz für aktuelle Beobachtungen, um von der Planansicht darauf zuzugreifen.

Beobachtungstypen

Zeigt den Beobachtungstyp an. Mögliche Typen sind:

RTK-Basislinien
Nachverarbeitete Basislinien	Statisch, FastStatic und Nachverarbeitet-Kinematisch
Terrestrische Beobachtungen	Konventionelle, Laser-Entfernungsmesser- und Reduzierte Beobachtungen
CAD-Layer

Wählen Sie den Layer, um Linien zu dem Beobachtungstyp hinzuzufügen. Die Linien werden unter Verwendung des voreingestellten Linienstils für den von Ihnen gewählten Layer gezogen. Wenn Sie mit Hilfe der Tastatur einen neuen Layer eingeben, erscheint das Dialogfeld Neuer Layer.


Projekteigenschaften - Überblick
Projekteigenschaften − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld
Überblick

Die Eigenschaften eines Projekts enthalten alle auf das Projekt bezogenen Einstellungen (z. B. das Koordinatensystem und die Anzeige-Einheiten). Sie können sie jederzeit ändern. Wenn Sie eine Projekteigenschaft ändern, wird das Projekt aktualisiert, um die Änderung widerzuspiegeln. Einige Projekteigenschaften können Projektdaten ändern (zum Beispiel, wenn das Koordinatensystem geändert wird). Seien Sie daher vorsichtig, wenn Sie Projekteigenschaften ändern, durch die bestehende Daten geändert werden könnten.

Sie können keine Änderungen an den Projekteigenschaften rückgängig machen.


Dialogfeld Projekteigenschaften

Verwenden Sie dieses Dialogfeld, um die projektbezogenen Einstellungen zu konfigurieren.

So greifen Sie darauf zu:

 Wählen Sie Datei / Projekteigenschaften.

Das Dialogfeld Projekteigenschaften verfügt über die folgenden Register:

  Register Koordinatensystem

  Register Berichte

  Register Projektdetails

  Register Neu berechnen

  Register Einheiten und Format

  Register Merkmale


Dialogfeld Projekteigenschaften - Register Projektdetails
Dialogfeld Projekteigenschaften − Register Projektdetails

Verwenden Sie dieses Register, um Daten über das Projekt/die Vorlage einzugeben, die in Berichten und Plots enthalten sein sollen.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie auf das Register Projektdetails.

HINWEIS: Klicken Sie in der Liste Projektdetails auf die rechte Maustaste, um auf ein Verknüpfungsmenü zuzugreifen, mit dem Sie bestehende Elemente löschen oder umbenennen und neue Elemente hinzufügen können. Alle Felder in diesem Register sind optional.

Titel

Geben Sie einen Titel für das aktuelle Projekt/die Vorlage in dieses Feld ein.

Beschreibung

Geben Sie eine Beschreibung des aktuellen Projekts/der Vorlage ein, falls erforderlich.

Referenz

Geben Sie eine Projekt-Referenznummer ein, um das Projekt mit Ihrem Büro-Kalkulationsverfahren zu verbinden.

Feld-Vermesser

Geben Sie den Namen des Vermessers ein, der die Vermessungsarbeit für das Projekt im Feld abgeschlossen hat, falls erforderlich.

Computer-Operator

Geben Sie den Namen des Computer-Operators für das Projekt ein, falls erforderlich.

Datum

Gemäß Voreinstellung wird in diesem Feld das Erstellungsdatum des Projekts aufgezeichnet. Dieser Vorgang wird in einem Vorlagenprojekt automatisch mit Hilfe des Datum-Feldcodes in diesem Feld ausgeführt.

Vertikales Datum

Geben Sie den Namen des vertikalen Datums ein.

Ausrüstung

Geben Sie die Seriennummer(n) Ihrer Ausrüstung ein.

HINWEIS: Wenn eine Vorlage geöffnet wird, werden keine Feldcode-Definitionen expandiert. Mit Hilfe dieser Eigenschaft können Sie die geeigneten Feldcode-Definitionen in Ihre Vorlagen eingeben. Die Feldcode-Definitionen werden expandiert, wenn ein Projekt erstmals geöffnet wird.


Dialogfeld Projekteigenschaften - Register Koordinatensystem
Dialogfeld Projekteigenschaften − Register Koordinatensystem

 Überblick und weitere Informationen

Verwenden Sie dieses Register, um das Koordinatensystem für das Projekt zu wählen und anzusehen.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie auf das Register Koordinatensystem.

Koordinatensystem-Einstellungen

Diese Gruppe enthält eine Zusammenfassung des aktuellen Koordinatensystems. Sie zeigt die örtliche Anpassung,  das System, die Zone, das Datum und das Geoidmodell an.

Das Dialogfeld Koordinatensystem wählen wird geöffnet, wenn Sie auf die Schaltfläche Ändern klicken. Dieses Dialogfeld ist die erste Seite eines Assistenten zur Auswahl eines Koordinatensystems.

HINWEIS: Verwenden Sie das Trimble Coordinate System Manager Programm, um Koordinatensysteme zu erstellen und zu verwenden.

Einstellungen örtliche Anpassung

Diese Gruppe enthält eine Zusammenfassung der Meßstelle. Sie zeigt Breitengrad, Längengrad, ellipsoidische Höhe des Projekts und die Methode zur Koordinaten-Anzeige an.

Das Dialogfeld Einstellungen örtliche Anpassung wird geöffnet, wenn Sie auf die Schaltfläche Ändern klicken. In diesem Dialogfeld können Sie den Projektstandort ändern, und festlegen, ob Sie Bodenkoordinaten verwenden möchten.

Details

Durch Klicken auf die Schaltfläche Details wird das Dialogfeld Koordinatensystem-Details geöffnet.

Verwenden Sie dieses Dialogfeld, um die vollständigen Parameter für die aktuelle Koordinatensystemprojektion, Datum-Transformation, horizontale Ausgleichung, vertikale Ausgleichung, das Geoidmodell und die örtliche Anpassung anzusehen.

Wenn Sie eine GPS-Kalibrierung im Projekt durchführen, sind die Koordinatensystem-Details eine Kombination der zugrundeliegenden Koordinatensystemparameter und GPS-Kalibrierungsparameter (horizontale Ausgleichung und vertikale Ausgleichung).

Wenn Sie eine Netzausgleichung durchführen, werden die Parameter als Ausgleichungsparameter verwendet.

Ein Koordinatensystem kann entweder Transformationsparameter für eine örtliche Anpassung oder  Netzausgleichungsparameter aufweisen, nicht beides.

Speichern als örtl. Anpassung

Wenn Sie auf die Schaltfläche Speichern…  klicken, wird das Dialogfeld Speichern als örtl. Anpassung geöffnet. Verwenden Sie dieses Dialogfeld, um die Koordinatensystem-Details (einschließlich aller aktuellen GPS-Kalibrierungen) als Definition der örtlichen Anpassung in der Koordinatensystem-Datenbank zu speichern.

Nachdem Sie der Definition der örtlichen Anpassung einen Namen gegeben haben, können Sie sie als Koordinatensystemdefinition für zukünftige Projekte verwenden. Verwenden Sie das Trimble Coordinate System Manager Programm, um die örtliche Anpassung zu bearbeiten

HINWEIS: Sie können keine Netzausgleichungsparameter in einer örtlichen Anpassung speichern.


Dialogfeld Koordinatensystem-Details - Register Projektion
Dialogfeld Koordinatensystem-Details − Register Projektion

So greifen Sie auf dieses Register zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie im Register Koordinatensystem auf Details. Das Dialogfeld Koordinatensystem-Details erscheint.

3.	Wählen Sie das Register Projektion.

Verwenden Sie dieses Register, um die Projektionsparameter anzusehen. Es zeigt den Projektionstyp (z. B. Transversal-Mercator oder Lambert) an. Die Felder, die angezeigt werden, sind von der Projektion abhängig.

Das Feld Süd-Azimut bezieht sich auf die Azimutreferenz. Die meisten Länder verwenden Norden als Azimutreferenz (Norden = 0°). Einige Regionen wie z. B. Südafrika und Hawaii jedoch verwenden Süden als Azimutreferenz (Süden = 0°). Wenn Sie in einer Region arbeiten, in der diese Methode verwendet wird, ist dieses Kontrollkästchen gewählt, wenn Sie die Projektionsparameter im Koordinatensystem-Assistenten oder das definierte Süd-Azimut-Koordinatensystem im Trimble Coordinate System Manager™-Programm einstellen.

Die Optionen Positive Koordinatenrichtung Nord, Süd, Ost oder West beziehen sich auf die Richtung, in der sich die Koordinaten erhöhen.


Dialogfeld Koordinatensystem-Details - Register Datum-Transformation
Dialogfeld Koordinatensystem-Details − Register Datum-Transformation

 Siehe auch

So greifen Sie auf dieses Register zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie im Register Koordinatensystem auf Details. Das Dialogfeld Koordinatensystem-Details erscheint.

3.	Wählen Sie das Register Datum-Transformation.

Verwenden Sie dieses Register, um die Ausgleichungsparameter anzusehen. Es zeigt die Transformationsmethode und -parameter an, die bei der Transformation vom WGS-84-Ellipsoid zum örtlichen Ellipsoid verwendet wurden. Die örtlichen Ellipsoidparameter werden in der Gruppe Örtliches Ellipsoid angezeigt.

Die verfügbaren Datum-Transformationsoptionen sind:

  Molodensky (Drei Parameter)

  Sieben Parameter

  Mehrfachregression

  Datum-Gitternetz

Die folgende Tabelle enthält die Felder, die für jede Option verfügbar sind:


Dialogfeld Koordinatensystem-Details - Register Ausgleichung
Dialogfeld Koordinatensystem-Details − Register Ausgleichung

So greifen Sie auf dieses Register zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie im Register Koordinatensystem auf Details. Das Dialogfeld Koordinatensystem-Details erscheint.

3.	Wählen Sie das Register Ausgleichung.

Verwenden Sie dieses Register, um die horizontalen und vertikalen Ausgleichungsparameter anzusehen. Die Ausgleichung wird in Form einer örtlichen Anpassung oder von Netzausgleichungstransformationsparametern auf die Vermessungsdaten angewendet durch:

  eine berechnete GPS-Kalibrierung

  eine von einer Survey Controller (*.dc)-Datei importierten Kalibrierung

  eine örtliche Anpassungsdefinition

  eine Netzausgleichung (wenn das Netzausgleichungsmodul installiert ist)

HINWEIS: Die Felder Gefälle Hoch und Gefälle Rechts in der Gruppe Kalibrierung Vertikale Ausgleichung werden in Teilen pro Million (ppm) angezeigt.


Dialogfeld Koordinatensystem-Details - Register Geoid-Modell
Dialogfeld Koordinatensystem-Details − Register Geoidmodell

So greifen Sie auf dieses Register zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie im Register Koordinatensystem auf Details. Das Dialogfeld Koordinatensystem-Details erscheint.

3.	Wählen Sie das Register Geoidmodell.

Verwenden Sie dieses Register, um die Geoidmodell-Details anzusehen. Es zeigt den Namen und die Definitionsdatei für jedes Geoidmodell an, das zur Bestimmung von orthometrischen Höhen für GPS-Positionen verwendet wird.

HINWEIS: Verwenden Sie das Dialogfeld Projekteigenschaften / Register Neu berechnen, um die Qualität des Geoidmodells anzusehen.


Dialogfeld Koordinatensystem-Details - Register Örtl. Anpassung
Dialogfeld Koordinatensystem-Details – Register Örtl. Anpassung

So greifen Sie auf dieses Register zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie im  Register Koordinatensystem auf Details. Das Dialogfeld Koordinatensystem-Details erscheint.

3.	Wählen Sie das Register Örtl. Anpassung.

In dem Register wird folgendes angezeigt:

  der Breitengrad, Längengrad und die ellipsoidische Höhe des Projektstandorts

  der Bodenmaßstabsfaktor, das falsche Hochwert-Offset, das falsche Rechtswert-Offset, und ob Bodenkoordinaten verwendet werden.


Dialogfeld Einstellungen örtliche Anpassung

Verwenden Sie das Dialogfeld  Einstellungen örtliche Anpassung, um den Projektstandort zu bearbeiten und um anzugeben, ob Bodenkoordinaten im Projekt verwendet werden sollen. So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Koordinatensystem.

3.	Klicken Sie in der Gruppe Einstellungen örtliche Anpassung auf Ändern.

Projektstandort

Verwenden Sie diese Gruppe, um den Projektstandort mit Hilfe eines Punktes in der Mitte des Projekts zu definieren. Der Projektstandort kann in Gitter-, örtlichen oder WGS-84 Koordinaten definiert werden.

HINWEIS: Sie können die Gitterkoordinaten eingeben, indem Sie den Standort im Graphikfenster wählen.

Sie müssen den Projektstandort am Anfang des Projekts definieren, da die Software diese Informationen für  Berechnungen verwendet. Sie verwendet:

  den Breitengrad des Projekts zur Berechnung des Erdradius

  den Breiten- und Längengrad des Projekts zur Berechnung des Gitter-Maßstabsfaktors

  die ellipsoidische Höhe des Projekts als Standardhöhe und zur Berechnung des Höhenfaktors.

Wenn das Koordinatensystem nicht definiert ist, erscheint das Dialogfeld Voreingestellte Projektionsdefinition. Geben Sie einen Ursprungsbreiten- und -längengrad ein, bevor Sie die Option Bodenkoordinaten verwenden wählen.

Bodenkoordinaten verwenden

Wählen Sie dieses Kontrollkästchen, wenn Sie Bodenkoordinaten in Ihrem Projekt verwenden möchten. Definieren Sie jedoch zuerst das Projekt-Koordinatensystem und den Projektstandort

Wenn dieses Kontrollkästchen gewählt ist, stehen alle Elemente in der Gruppe Bodenkoordinaten verwenden zur Verfügung. Das Kontrollkästchen Maßstabsfaktor aus Projektstandort berechnen ist deaktiviert, wenn Sie das Dialogfeld Einstellungen örtliche Anpassung zum ersten Mal aufrufen.

HINWEIS: Die Software kann den Bodenmaßstabsfaktor nur berechnen, wenn Werte in die Felder Hochwert, Rechtswert und Höhe in der Gruppe Projektstandort eingegeben wurden.

HINWEIS: Wenn Sie eine GPS-Kalibrierung durchführen und dann das Kontrollkästchen Bodenkoordinaten verwenden wählen, wird die im Projekt definierte Kalibrierung ungültig. Eine Warnmeldung weist darauf hin, daß die Kalibrierung entfernt wird, wenn Sie fortfahren.

Bodenkoordinaten-Anzeige

Mit der Option Bodenkoordinaten-Anzeige können Sie die Anzeige der Bodenkoordinaten in einem Trimble Geomatics Office Projekt ändern. Diese Änderung erleichtert die Unterscheidung zwischen Projektions- und Bodenkoordinaten. Wählen Sie eine der folgenden Optionen:

  Hochwert-Offset/Rechtswert-Offset −fügt ein Offset zu den angezeigten Koordinaten hinzu

  Vierstellige Koordinaten − zeigt vier Dezimalstellen in der Bodenkoordinaten-Anzeige an. Wenn die Projektkoordinate z. B. 264150,000 ist, wird die Bodenkoordinate als 4 510,000 dargestellt.

  Fünfstellige Koordinaten − zeigt fünf Dezimalstellen in der Bodenkoordinaten-Anzeige an. Wenn die Projektkoordinate z. B. 264150,000 ist, wird die Bodenkoordinate als 64 510,000 dargestellt.


Dialogfeld Speichern als örtl. Anpassung

Verwenden Sie dieses Dialogfeld, um das aktuelle Koordinatensystem als örtliche Anpassung zu speichern.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Klicken Sie auf Speichern.

Örtl. Anpassung

Geben Sie den Namen für die örtliche Anpassung ein.

OK

Klicken Sie auf OK, um die örtliche Anpassung zu speichern. Die örtliche Anpassung wird in der Koordinatensystem-Datenbank gespeichert. Jede örtliche Anpassung, die Sie speichern, erscheint im Register Örtliche Anpassungen im Trimble Coordinate System Manager™-Programm. Sie können die örtliche Anpassungsdefinition als Koordinatensystemdefinition für zukünftige Projekte verwenden.

TIP: Wenn Sie das Coordinate System Manager-Programm verwenden, klicken Sie auf das Register Örtliche Anpassungen. Die örtliche Anpassung erscheint in blau.

HINWEIS: Sie können Ausgleichungstransformationsparameter nicht als örtliche Anpassung speichern.


Dialogfeld Projekteigenschaften - Register Einheiten und Format
Dialogfeld Projekteigenschaften − Register Einheiten und Format

Verwenden Sie dieses Register, um die in Trimble Geomatics Office verwendeten Einheitswerte einzustellen (wie z. B. die Bildschirmanzeige, Importieren, Exportieren und Berichte).

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Einheiten und Format.

Koordinate

Stellen Sie die Anzeige-Einheiten für Koordinatenwerte (Hochwert und Rechtswert) ein. Die Darstellungsmöglichkeiten sind Internationale Fuß, Links, Meter, US-Vermessungs-Fuß oder Namibische Meter.

Höhe/EllH

Stellen Sie die Anzeige-Einheiten für Höhen ein. Die Darstellungsmöglichkeiten sind Internationale Fuß, Links, Meter, US-Vermessungs-Fuß oder Namibische Meter.

Dezimalstellen Koordinate

Stellen Sie die Anzahl der Dezimalstellen für die Anzeige von Koordinaten ein. Sie können bis zu fünf Dezimalstellen festlegen.

Koordinatenreihenfolge

Stellen Sie die Koordinatenreihenfolge ein. Die Darstellungsmöglichkeiten sind Hochwert zuerst oder Rechtswert zuerst.

Cursor-Position anzeigen als

Stellen Sie die Anzeige der Cursor-Position in der Statusleiste ein. Die Darstellungsmöglichkeiten sind Gitter, Örtliche Br, Lä und WGS Br, Lä.

Strecke

Stellen Sie die Streckenanzeige ein. Die Darstellungsmöglichkeiten sind Chains, Internationale Fuß, Internationale Meilen, Kilometer, Links, Meter, US-Vermessungs-Fuß oder Namibische Meter.

Dezimalstellen Strecke

Stellen Sie die Anzahl der Dezimalstellen für die Streckenanzeige ein. Sie können bis zu fünf Dezimalstellen festlegen.

Strecke anzeigen als

Stellen Sie den Streckentyp ein, der angezeigt werden soll. Die Darstellungsmöglichkeiten sind:

  Ellipsoid-Strecken (NN-Strecken)

Hierbei handelt es sich um die Strecke zwischen zwei Datenbank-Punkten, die auf der Referenz-Ellipsoidoberfläche (bei Höhe = 0) berechnet wird.

  Gitter-Strecken

Dies ist die pythagoräische Strecke zwischen den Projektionskoordinaten der beiden Endpunkte. Das heißt, es wird keine Projektionsausgleichung angewendet. Das bedeutet, daß der Maßstabsfaktor der Projektion für die Linie nicht zur Anwendung kommt.

  Bodenstrecken

Dies ist die Strecke parallel zum Ellipsoid, die an der durchschnittlichen Höhe über dem Ellipsoid berechnet wird. Es ist die mathematisch berechnete ellipsoidische Strecke, ausgeglichen für die durchschnittliche Höhe der Endpunkte. Wenn Bodenkoordinaten verwendet werden, sollte die Gitter-Strecke der Bodenstrecke entsprechen. Dies wird beschrieben als:

wobei

H	die Datenbankhöhe repräsentiert

R	den Erdradius repräsentiert

DE	die ellipsoidische Strecke repräsentiert

Fläche

Stellen Sie die Anzeige-Einheiten für Flächen ein. Die Darstellungsmöglichkeiten sind Quadratmeter, Hektar, Morgen und Quadratfuß.

Dezimalstellen Fläche

Stellen Sie die Anzahl der Dezimalstellen für die Anzeige von Flächen ein. Sie können bis zu fünf Dezimalstellen festlegen.

Winkeleinheiten

Stellen Sie die für alle horizontalen Richtungen und Azimute verwendeten Winkeleinheiten ein. Die Darstellungsmöglichkeiten sind Grad, Gon und Mil.

Winkelformat (Grad)

Stellen Sie das Format von Winkeln oder Azimuten ein, wenn in Grad angegeben. Die Darstellungsmöglichkeiten sind:

  GGG.gggg	Dezimalgrad

  GGGMM'SS	Grad, Minuten und Sekunden

  GGGMM'SS.s	Grad, Minuten und Dezimalsekunden

  GGGMM.mm	Grad und Dezimalminuten

Winkelformat (Gon/Mil)

Stellen Sie das Format von Winkeln oder Azimuten ein, wenn in Gon oder Mils angegeben. Die Darstellungsmöglichkeiten sind drei, vier oder fünf Dezimalstellen.

Azimutformat

Stellen Sie das Format von Azimutwerten ein. Die Darstellungsmöglichkeiten sind:

  Quadrantwinkel (in der Form N6207'40"W dargestellt)

  Vollkreis (in der Form 29752'20" dargestellt)

WGS-84 anzeigen als

Stellen Sie die Option WGS-84 anzeigen als auf B,L,H oder X,Y,Z ein. Die Einstellung hier bestimmt, wie die WGS-84-Koordinaten für Punkte im Eigenschaftsfenster angezeigt werden, wenn Sie einen Punkt einfügen oder Koordinaten für einen Punkt unter Verwendung des Trimble Coordinate System Manager™-Programms bearbeiten. Diese Einstellung wird zudem verwendet, wenn Sie mit den WGS-84-Werten ein benutzerdefiniertes Import-, Berichts- oder Exportformat erzeugen.

Format Br, Lä, Hö

Stellen Sie das Format von Breitengrad- und Längengradwerten ein. Die Darstellungsmöglichkeiten sind:

  GGG.ggggggggg	Dezimalgrad

  GGGMM'SS.sssss	Dezimalsekunden

  GGGMM.mmmmmmm	Dezimalminuten

Maßstabsformat

Stellen Sie die Anzeige und Interpretation von Maßstabswerten ein. Die Darstellungsmöglichkeiten sind:

  1“ zu X ft	Englische Maßeinheiten

  1:X	Metrische Maßeinheiten

Tausender-Trennzeichen anzeigen

Stellen Sie die Anzeige der Tausender-Trennzeichen ein.

Die Darstellungsmöglichkeiten sind Ja oder Nein. Wenn Sie Ja wählen, wird das in Ihrem Microsoft Windows System festgelegte Tausender-Trennzeichen auf numerische Werte angewendet. Weitere Informationen finden Sie in den Ländereinstellungen in der Microsoft Windows Systemsteuerung.

HINWEIS: Wenn dieses Feld auf Ja eingestellt ist, ist das Tausender-Trennzeichen erwartungsgemäß in importierten ASCII-Dateien vorhanden und wird in exportierten ASCII-Dateien und Berichten verwendet. Dies kann dazu führen, daß Datei-Importe fehlschlagen und Dateien exportiert werden, die nicht dem erwarteten Format entsprechen. (z. B. eine Datei mit Komma als Trennzeichen mit numerischen Werten, die ein Tausender-Trennzeichen mit Komma verwendet). Die Feldcode-Zusatzoption "Standard" kann bei Formatdefinitionen verwendet werden, so daß die Verarbeitung numerischer Werte zwangsweise Tausender-Trennzeichen unterdrückt und grundsätzlich ein Punkt als Dezimalzeichen erwartet wird.

Einheiten anzeigen

Legt fest, ob die Koordinateneinheiten im Eigenschaftsfenster und in der Statusleiste angezeigt werden. Die Voreinstellung ist Ja.

Nullen anzeigen als

Stellen Sie die Anzeige für Null-Werte ein.

Autom. Punktnamen beginnen mit

Stellen Sie die automatische Punktnumerierung ein. Dieser Wert wird verwendet, wenn Koordinaten hinzugefügt oder von der Software erzeugt werden. Der Punktname wird automatisch erhöht.

Gefälle-Format

Stellen Sie das Gefälleformat ein. Es wird in der Trimble RoadLink™ Software verwendet und angezeigt. Die Darstellungsmöglichkeiten sind Prozent oder Verhältnis.

Gefälleformat Seitengefälle

Dies wird in der Trimble RoadLink Software verwendet und angezeigt. Die Darstellungsmöglichkeiten sind Prozent oder Verhältnis.

Verhältniseinheiten

Stellen Sie Reihenfolge des Verhältnisformats ein, das in der Trimble RoadLink Software verwendet und angezeigt werden soll. Die Darstellungsmöglichkeiten sind Fallend zu steigend oder Steigend zu fallend. Fallend zu steigend erscheint z. B. als 1:100. Steigend zu fallend erscheint als 100:1.

Stationsformat

Stellen Sie das Format für die Anzeige von Stationswerten in der Trimble RoadLink Software ein. Die Formatoptionen sind:

  1000.0

  10+00.0

  1+000.0

  1/000.0

Volumen-Einheiten

Stellen Sie die Volumen-Einheiten ein, die in der Trimble RoadLink Software verwendet und angezeigt werden sollen. Die Darstellungsmöglichkeiten sind Kubikmeter, Kubikfuß oder Kubikyard.

GPS-Zeitanzeige

Stellen Sie das Zeitanzeige-Format ein. Die Optionen sind Ortszeit, GPS-Zeit und UTC-Zeit.


Dialogfeld Projekteigenschaften - Register Berichte
Dialogfeld Projekteigenschaften − Register Berichte

Verwenden Sie dieses Register, um die Berichteinstellungen für das Projekt festzulegen.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Berichte.

Erzeugten Bericht anzeigen

Die Option “Erzeugten Bericht anzeigen” steuert die Darstellung aller Berichte, die bei Vorgängen wie Daten importieren, Neuberechnungen und Kartiercode-Verarbeitungen erzeugt werden. Berichte werden immer für diese Vorgänge erzeugt und in dem entsprechenden Bericht-Ordner für das Projekt gespeichert.

Diese Optionen steuern die Darstellung von Berichten nach den Verarbeitungsvorgängen wie folgt:

Immer	Es wird immer ein Bericht über jede durchgeführte Verarbeitung angezeigt — wenn während der Verarbeitung keine Fehler- oder Warnmeldungen angezeigt worden sind, besteht der Bericht lediglich aus einem Vorspann und Informationen bezüglich des durchgeführten Verarbeitungsvorgangs.
Bei Fehler	Tritt während der Verarbeitung ein Fehler auf, wird der Bericht über diese Verarbeitung, der Details über den/die aufgetretenen Fehler enthält, automatisch angezeigt.
Bei Fehler fragen	Tritt während der Verarbeitung ein Fehler auf, wird eine Warnmeldung angezeigt, die darauf hinweist, daß ein Fehler aufgetreten ist. Sie können einen Bericht mit Details zu dem(n) Fehler(n) erhalten.
Nie	Sie werden nicht gewarnt, wenn ein Fehler während der Verarbeitung aufgetreten ist, und es wird kein Bericht mit Details erzeugt.
Immer fragen	Sie werden bei jeder Verarbeitung gefragt, ob Sie den Bericht ansehen möchten.


Dialogfeld Projekteigenschaften - Register Neu berechnen
Dialogfeld Projekteigenschaften − Register Neu berechnen

Verwenden Sie dieses Register, um die Neuberechnungseinstellungen für das Projekt festzulegen.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Neu berechnen.

Mehrfache Polarpunkt-Beobachtungen

Verwenden Sie diese Gruppe, um anzugeben, wie bei der Neuberechnung die Position für mehrfach beobachtete Polarpunkte bestimmt wird. Ein Polarpunkt hat keine:

  Beobachtungen, die von ihm ausgeht

  Festpunktkoordinaten

  Statischen oder FastStatic-Beobachtungen, die zu dem Punkt durchgeführt wurden.

Beste Beobachtung verwenden

Wählen Sie diese Option, wenn Sie nicht möchten, daß bei der Neuberechnung der Mittelwert für Beobachtungen zu Polarpunkten berechnet wird. Für die Positionsbestimmung eines jeden Punktes wird die beste Beobachtung verwendet. Diese Option ist gemäß Voreinstellung gewählt.

Mittelwert aus demselben Beobachtungstyp berechnen (GPS, Konventionell, Reduziert, Laser)

Wählen Sie diese Option, wenn Sie möchten, daß bei der Neuberechnung der Mittelwert der Koordinaten berechnet wird, die für jede Beobachtung desselben Typs abgeleitet wurden. Bei der Neuberechnung wird niemals der Mittelwert von Koordinaten berechnet, die von unterschiedlichen Beobachtungstypen abgeleitet wurden. Die Mittelwertberechnung von Koordinaten, die von einer konventionellen Beobachtung abgeleitet wurden, wird z. B. nie zusammen mit Koordinaten durchgeführt, die durch eine GPS-Beobachtung bestimmt wurden. Die Mittelwertberechnung findet nur für Polarpunkte statt.


Toleranzprüfung

Wählen Sie diese Kontrollkästchen, wenn bei der Neuberechnung die Toleranzprüfung durchgeführt werden soll. Bei der Neuberechnung werden die Toleranzwerte zur Berechnung des Koordinatenmittels verwendet, wenn die Option Mittelwert aus demselben Beobachtungstyp berechnen gewählt ist. Sie können Toleranzen für Punkte mit Vermessungsgüte, Kartographiegüte und Unbekannter Güte einstellen.

Die Toleranzwerte werden verwendet, wenn ein Abschlußfehler für einen Punkt angezeigt wird, der mehrere Koordinaten oder Beobachtungen aufweist. Wenn sich die von allen Beobachtungen und Koordinaten abgeleiteten Koordinaten außerhalb der Toleranz befinden, wird ein Abschlußfehler gemeldet, und eine Warnkennzeichnung erscheint auf dem Punkt. Ein Fehler außerhalb der Toleranz wird in der Seite Warnung im Eigenschaftsfenster angezeigt.

Horizontal

Geben Sie den Toleranzwert für die horizontale Positionskomponente ein.

Vertikal

Geben Sie den Toleranzwert für die vertikale Positionskomponente ein.

Terrestrische Beobachtungen auf Ellipsoid reduzieren (NN-Korrektur)

Wählen Sie dieses Kontrollkästchen, wenn konventionell beobachtete Strecken bei der Neuberechnung auf das Ellipsoid korrigiert werden sollen.

NN-(Meereshöhen-)Korrekturen sollten angewendet werden, es sei denn, Sie wissen, daß diese Korrektur bereits auf die in der Datenbank gespeicherten Feldstreckenmessungen angewendet wurde bzw. die eingegebenen Koordinaten sind keine Gitter-, sondern Bodenkoordinaten. Wenn diese Korrektur nicht angewendet wird, und die konventionellen Daten in bedeutender Höhe über Normalnull aufgezeichnet wurden, sind die berechneten Koordinaten falsch.

Diese Korrektur trifft nicht auf GPS-Daten zu, da sich diese Daten immer auf das WGS-84-Ellipsoid beziehen.

HINWEIS: Wenn Sie GPS- und terrestrische Messungen kombinieren, müssen Sie die Beobachtungen auf das Ellipsoid reduzieren.

HINWEIS  Sie können die Option Strecke anzeigen als im Register Einheiten und Format verwenden, um zu bestimmen, wie Strecken zwischen Datenbank-Punkten dargestellt werden sollen. Wenn Sie die Option auf Bodenstrecken einstellen, wird die tatsächliche horizontale Komponente jeder gemessenen Bodenstrecke angezeigt.

Weitere Informationen finden Sie unter dem Thema Meereshöhen-Korrektur.

Qualität Geoidmodell

Wählen Sie die Qualität für das im Projekt verwendete Geoidmodell. Wenn es eine Genauigkeit von bis zu 5 m aufweist, wählen Sie Kartographiegüte. Wenn Sie sicher sind, daß das Geoidmodell Vermessungsgenauigkeit aufweist, wählen Sie die Option Vermessungsgüte. Diese Qualität wird bei der Neuberechnung verwendet, um die orthometrische Höhenqualität (für einen GPS-Punkt) oder Ellipsoidische Höhen (für terrestrische Punkte) zu bestimmen, die von dem Geoidmodell abgeleitet werden. Dieses Feld ist nicht verfügbar, wenn im Koordinatensystem des Projekts kein Geoid verwendet wird.


Dialogfeld Projekteigenschaften - Register Merkmale
Dialogfeld Projekteigenschaften − Register Merkmale

Verwenden Sie dieses Register, um die Merkmals- und Attributeinstellungen für das Projekt zu spezifizieren.

So greifen Sie darauf zu:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Merkmale.

Kartiercode beim Importieren

Wählen Sie das Kontrollkästchen Kartiercode beim Importieren, um Kartiercodes automatisch zu verarbeiten, wenn eine Geräte-Datei importiert wird. Wählen Sie die Merkmals- und Attributbibliothek, die Sie verwenden möchten, um die Kartiercodes automatisch zu verarbeiten.

HINWEIS: Wenn Sie diese Option wählen, können Sie Kartiercodes immer noch zu einem späteren Zeitpunkt unter Verwendung des Menüs Hilfsmittel in der Planansicht verarbeiten und eine beliebige Merkmals- und Attributbibliothek verwenden. (Sie müssen nicht die Bibliothek verwenden, die Sie in diesem Dialogfeld gewählt haben.)

Bibliothek

Geben Sie die Bezeichnung der Merkmals- und Attributdatei ein, die Sie verwenden möchten, oder klicken Sie auf Durchsuchen, und ermitteln Sie sie. Dieses Feld ist nur verfügbar, wenn Sie das Kontrollkästchen Kartiercode beim Importieren wählen.

Attribute verwenden

Wählen Sie das Kontrollkästchen Attribute verwenden, um das Projekt/die Vorlage für Attribute einzustellen.

Dieses Feld bezieht sich nur auf die für Attributdefinitionen verwendete Bibliothek.

Bibliothek

Geben Sie den Pfad und Namen in das Feld Bibliothek ein, oder klicken Sie auf Durchsuchen, um die Bibliothek zu wählen.

Durchsuchen

Klicken Sie auf Durchsuchen, und ermitteln Sie die erforderliche Attribut-Verzeichnis (*.ddf)-Datei oder Merkmals- und Attributbibliothek (*.fcl)-Datei. Der voreingestellte Ordner ist der Trimble Geomatics Office-Systemordner.

Wenn keine Punkte mit Merkmalen in der Datenbank enthalten sind, können Sie die mit dem Projekt verknüpfte Merkmals- und Attributbibliothek ändern.

Sobald Sie jedoch eine Survey Controller (*.dc)-Datei importieren, die Attribute enthält oder Attribute unter Verwendung des Eigenschaftsfensters hinzufügen, können Sie die Merkmals- und Attributbibliothek, die zur Einrichtung des Projekts für Attribute verwendet wurde, nicht ändern. Dies stellt sicher, daß übereinstimmende Attributdaten im Projekt vorhanden sind.


Trimble Geomatics Office-Dateien - Überblick
Trimble Geomatics Office-Dateien − Überblick

Trimble Geomatics Office, das auf Ihrem Computer installiert ist, enthält mehrere Dateien, in denen verschiedene System- und Projekt-Einstellungen gespeichert sind.

WARNUNG: Bearbeiten Sie diese Dateien nur, wenn es wirklich erforderlich ist. Es könnte sein, daß sich Fehler einschleichen und Trimble Geomatics Office nicht erwartungsgemäß arbeitet. Wenn Sie die Dateien bearbeiten möchten, legen Sie zuerst eine Sicherungskopie an.

Diese Dateien sind in die folgenden Abschnitte aufgeteilt:

Trimble-Dateien

Diese Dateien befinden sich im Ordner Programme\Gemeinsame Dateien\Trimble:

  Current.csd

  Antenna.ini

  Receiver.ini

Trimble Geomatics Office-System-Dateien

Diese Dateien befinden sich im Ordner Programme\Trimble\Trimble Geomatics Office\System:

  Asciiexp.dat

  Asciiimp.dat-Datei

  Asciirpt.dat

  Html-Dateien

  Symbols.sym

  Linetype.ltp

  Default.fcl

  Frm-Dateien

Projekt-Dateien

Diese Dateien befinden sich im Stammverzeichnis jedes Projekts (normalerweise C:\Trimble Geomatics Office\Projekte\<Projektname>:

  Options.ini

  TGO_v160.mdb

  TGO_v160.dbs


Options.ini-Datei

 Siehe auch

Eine Options.ini-Datei ist mit jedem Projekt verknüpft. Sie befindet sich im Ordner mit dem Projektnamen. Diese Datei ermöglicht die Kontrolle der Daten, die im Eigenschaftsfenster, in der Punktzusammenfassung und der Berichtinfo angezeigt werden.

Die Options.ini-Datei gliedert sich in drei Abschnitte

  Zusammenfassung [Summary]

  Bericht [Report]

  Beschriftungen [Labels]

Die Zusammenfassungsdefinition konfigurieren

In der Zusammenfassungsdefinition in der Options.ini-Datei können Sie die Punktdetails angeben, die auf der Statusleiste bei der Auswahl von Punkten angezeigt werden, sowie die QuickInfo, die angezeigt wird, wenn Sie den Mauszeiger über einem Punkt positionieren. Gemäß Voreinstellung ist sie auf [Name]: [Kartiercode] eingestellt, sodaß Punkte sowohl mit Namen als auch mit dem Kartiercode zusammengefaßt werden.

Wenn Sie es vorziehen, daß Punkte mit Namen und Punktstil, durch ein '/' getrennt, zusammengefaßt werden, definieren Sie den Abschnitt Zusammenfassung [Summary] der Options.ini-Datei als:

Point=[Name]/[Point Style]

Sie können zudem Linien-, Bogen-, Kurven- und Textelementen spezifische Zusammenfassungen zuordnen. Wenn Sie z. B. Azimut und Strecke als Zusammenfassung für eine Linie angegeben werden soll, fügen Sie die folgende Definition zum Abschnitt Zusammenfassung [Summary] hinzu:

Line=Az: [Azimuth] Dist: [Distance]

Sie können Text neben Feldcodes in der Zusammenfassungsspezifikation einschließen.

Gemäß Voreinstellung besteht die Zusammenfassung für Linien, Bögen und Kurven aus den durch ein Komma voneinander getrennten Punktzusammenfassungen für die Start- und Endpunkte.

Die Berichtinfo konfigurieren

Im Abschnitt Bericht [Report] können Sie einen Standard-Berichtskopf spezifizieren, der in alle Berichte eingeschlossen werden kann, die unter Verwendung eines einzelnen Feldcodes namens [$Bericht.Info] erzeugt werden. Die Berichtinfo kann aus einer Mischung von Text und Feldcodes bestehen. Verwenden Sie ‘\n’, um anzuzeigen, wo eine neue Zeile beginnen soll. Damit können Sie die Info über mehrere Zeilen verteilen. Sie können z. B. Ihren Firmennamen in die Standard-Berichtinfo einschließen.

Die Beschriftungsoptionen konfigurieren

Im Abschnitt Beschriftungen [Labels] können Sie neue Beschriftungsoptionen hinzufügen, die im Dialogfeld Beschriftungen erscheinen.

Sie können eine Kombination von Feldcodes und Text verwenden, um eine Beschriftungsdefinition zu definieren. Verwenden Sie das Zeichen ‘|’, um die einzelnen Beschriftungsoptionen voneinander zu trennen und auch, um den Namen der Beschriftungsoption vom angezeigten Beschriftungstext zu trennen. Geben Sie z. B. folgendes direkt nach der letzten Beschriftungsoption mit Hilfe der Tastatur ein:

|Description|[Description]

Dies fügt eine neue Beschriftungsoption namens ‘Beschreibung’ zum Dialogfeld hinzu. Wenn diese gewählt wird, wird der Wert für jeden beschrifteten Punkt im Feld Beschreibung angezeigt.

HINWEIS: Sie können keine Beschriftungsoptionen für Linien, Kurven oder Bögen definieren.


TGO_v160.mdb-Datei

 Siehe auch

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank nur mit Trimble Geomatics Office. Trimble unterstützt weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank mit anderen Software-Anwendungen. Trimble behält sich vor, das Format dieser Datenbank jederzeit ändern, wodurch sie inkompatibel mit anderen Software-Anwendungen werden würde.

Jedes Projekt verfügt über eine Microsoft Access Datenbank(*.mdb)-Datei namens TGO_v160.mdb. Sie befindet sich in dem Projektordner. Diese Datei enthält alle Projektdaten einschließlich Tabellen und Abfragen. Wenn Sie über Microsoft Access (Access 2000 oder höher) verfügen, können Sie:

  die Daten des Projekts ansehen

  Ihre eigenen Abfragen erzeugen


TGO_v160.dbs-Datei

Wenn Sie ein neues Trimble Geomatics Office-Projekt zum ersten Mal schließen, wird eine Datenbankschema (*.dbs)-Datei erstellt. Sie basiert auf der Microsoft Access Datenbank (*.mdb)-Datei.

Sowohl die .dbs-Datei als auch die .mdb-Datei befinden sich im Stammordner des Projekts.

Wenn Sie eine benutzerdefinierte Abfrage zur Datenbank hinzufügen, müssen Sie diese .dbs-Datei löschen, nachdem Sie die Abfrage erzeugt haben.

Eine neue .dbs-Datei (die die neue Abfrage enthält) wird erstellt, wenn Sie das Projekt das nächste Mal öffnen und die Abfrage zur Verfügung steht.


Antenna.ini-Datei

Diese Datei enthält die verfügbaren GPS-Antennen in Trimble Geomatics Office. Sie wird von dieser Software und auch von anderer Trimble Software verwendet.


Receiver.ini-Datei

Diese Datei enthält eine Liste der verfügbaren Empfänger. Sie sollten diese Datei nicht bearbeiten.


Asciiexp.dat-Datei

Diese Datei befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System.

Sie enthält alle ASCII- und benutzerdefinierten Exportformate für Trimble Geomatics Office. Diese Datei wird jedesmal gelesen, wenn Sie auf das Dialogfeld Exportieren zugreifen.

Führen Sie einen der folgenden Schritte aus, um auf dieses Dialogfeld zuzugreifen:

  Wählen Sie das Symbol Exportieren [image].

  Wählen Sie Datei / Exportieren.

Die folgenden Zeichen weisen darauf hin, in welchem Register das Format erscheint. In dieser Datei sind nur ASCII-Formate enthalten:

Zeichen	Register
=	Vermessung
+	CAD/ASCII
*	GIS
Keine	Benutzerdefiniert

Sie können nur die im Register Benutzerdefiniert verfügbaren Formate bearbeiten. Wenn Sie daher ein Format im Register CAD / ASCII bearbeiten möchten, entfernen Sie das Pluszeichen (+) am Anfang der Formatdefinition.

Die folgende Zeile ist z. B. in der Asciiexp.dat-Datei enthalten:

+ SDRmap-Koordinaten

Entfernen Sie das Pluszeichen (+), um das Format bearbeiten zu können.

Wenn Sie das nächste Mal auf das Dialogfeld Exportieren zugreifen, erscheint das Format im Register Benutzerdefiniert, und die Schaltfläche Bearbeiten wird verfügbar.

Sie können auch ein benutzerdefiniertes Format in ein schreibgeschütztes Format umwandeln, indem Sie eines der obigen Zeichen am Anfang des Formatnamens einfügen.

Die folgende Zeile ist z. B. in der Asciiexp.dat-Datei enthalten:

Punkte mit Trennzeichen

Ändern Sie diese Zeile zu:

+Punkte mit Trennzeichen

Wenn Sie das nächste Mal auf das Dialogfeld Exportieren zugreifen, erscheint das Format im Register CAD / ASCII, und die Schaltfläche Bearbeiten ist nicht verfügbar.


Asciiimp.dat-Datei

Diese Datei befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System. Sie enthält alle ASCII- und benutzerdefinierten Importformate für Trimble Geomatics Office. Diese Datei wird jedesmal gelesen, wenn Sie auf das Dialogfeld Importieren zugreifen.

Führen Sie einen der folgenden Schritte aus, um auf dieses Dialogfeld zuzugreifen:

  Wählen Sie das Symbol Importieren [image].

  Wählen Sie Datei / Importieren.

Die folgenden Zeichen weisen darauf hin, in welchem Register das Format erscheint. In dieser Datei sind nur ASCII-Formate enthalten:

Zeichen	Register
=	Vermessung
+	CAD / ASCII
Keine	Benutzerdefiniert

Sie können nur die im Register Benutzerdefiniert verfügbaren Importformate bearbeiten. Wenn Sie daher ein Format im Register CAD / ASCII bearbeiten möchten, entfernen Sie das Pluszeichen (+) am Beginn der Formatdefinition.

Die folgende Zeile ist z. B. in der Asciiimp.dat-Datei enthalten:

+WILDsoft-Format

Entfernen Sie das Pluszeichen (+), um das Format zu bearbeiten.

Wenn Sie das nächste Mal auf das Dialogfeld Importieren zugreifen, erscheint das Format im Register Benutzerdefiniert, und die Schaltfläche Bearbeiten wird verfügbar. Sie können auch ein benutzerdefiniertes Format in ein schreibgeschütztes Format umwandeln, indem Sie eines der obigen Symbole direkt vor dem Formatnamen einfügen.

Die folgende Zeile ist z. B. in der Asciiimp.dat-Datei enthalten:

Punkte mit Trennzeichen

Ändern Sie diese Zeile zu:

+Punkte mit Trennzeichen

Wenn Sie das nächste Mal auf das Dialogfeld Importieren zugreifen, erscheint das Format im Register CAD / ASCII, und die Schaltfläche Bearbeiten ist nicht verfügbar.


Asciiimp.dat-Datei
Asciirpt.dat file

Diese Datei befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System. Sie enthält alle Datenbank-Berichtformate für Trimble Geomatics Office. Diese Datei wird jedesmal gelesen, wenn Sie auf das Dialogfeld Zusätzliche Berichte zugreifen.

Wählen Sie hierzu Berichte / Zusätzliche Berichte.

Sie können jedes System-Datenbankformat im Dialogfeld Zusätzliche Berichte in ein Format umwandeln, das Sie bearbeiten können, indem Sie das Gleichheitszeichen (=) vor dem Formatnamen in der Datei entfernen.

Die folgende Zeile ist z. B. in der Asciirpt.dat-Datei enthalten:

=Punkte

Entfernen Sie das Gleichheitszeichen (=), um dieses Format zu bearbeiten

Das Format erscheint nun im Dialogfeld Zusätzliche Berichte, in dem es bearbeitet werden kann. Sie können auch ein benutzerdefiniertes Format im Dialogfeld Zusätzliche Berichte in ein Format umwandeln, das nicht bearbeitet werden kann, indem Sie ein Gleichheitszeichen (=) direkt vor dem Formatnamen einfügen.

Die folgende Zeile ist z. B. in der Asciirpt.dat-Datei enthalten:

Liste mit Punkten fester Breite

Ändern Sie diese Zeile zu:

=Liste mit Punkten fester Breite

Das Format erscheint nun im Dialogfeld Zusätzliche Berichte und kann nicht bearbeitet werden.


.html-Dateien

Eine Reihe von Hypertext Markup Language (.html)-Musterdateien sind im Ordner Programme\Trimble\Trimble Geomatics Office\System installiert. Diese Muster werden verwendet, um Systemberichte zu erzeugen. Diese Dateien sollten nicht gelöscht werden.

Von Trimble Geomatics Office erzeugte Berichte (z. B. Recompute.html) werden in dem entsprechenden Berichtordner (Reports) des Projekts gespeichert. Um einen .html-Bericht zu öffnen, doppelklicken Sie auf den Bericht im Microsoft Windows Explorer. Er wird in dem voreingestellten HTML-Anzeigemodul geöffnet.

HINWEIS: Sie können diese .html-Dateien modifizieren, um die Informationen anzupassen, die in den Systemberichten erscheinen. Trimble unterstützt oder garantiert jedoch nicht, daß modifizierte .html-Dateien erwartungsgemäß arbeiten. Trimble empfiehlt, daß Sie eine Sicherungskopie von jeder .html-Datei anlegen, bevor Sie diese modifizieren.


Symbols.sym-Datei

Die Datei Symbols.sym befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System.

Verwenden Sie das Trimble Symbol Editor™-Programm, um diese Datei anzusehen und zu bearbeiten. Die Datei enthält Symbole. In Trimble Geomatics Office oder im Trimble Feature and Attribute Editor-Programm können Sie neue Punktstile unter Verwendung der verfügbaren Symbole aus dieser Datei erzeugen.

Sie können zudem Ihre eigenen .sym-Dateien erstellen. Weitere Informationen über die Verwendung von .sym-Dateien finden Sie im Kapitel Programme im Trimble Geomatics Office-Benutzerhandbuch.


Linetype.ltp-Datei

Die Datei Linetype.ltp befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System. Verwenden Sie das Trimble Line Type Editor™-Programm, um diese Datei anzusehen und zu bearbeiten.

Die Datei enthält Linientypen. In Trimble Geomatics Office oder im Trimble Feature and Attribute Editor™-Programm können Sie neue Linienstile unter Verwendung der verfügbaren Linientypen aus dieser Datei erzeugen.

Sie können zudem Ihre eigenen .ltp-Dateien erstellen. Weitere Informationen über die Verwendung von .ltp-Dateien finden Sie im Kapitel Programme im Trimble Geomatics Office-Benutzerhandbuch.


Default.fcl-Datei

Die Datei Default.fcl befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System. Verwenden Sie das Trimble Feature and Attribute Editor™-Programm, um diese Datei anzusehen und zu bearbeiten. Alle .fcl-Dateien sind Merkmals- und Attributbibliotheken.

Die Datei enthält vordefinierte Kartiercodes (mit und ohne Attribute), Punktstile, Linienstile, Anmerkungsstile und Steuercodes.

So verwenden Sie diese Datei:

1.	Übertragen Sie sie zu Trimble Survey Controller, um Kartiercode-Informationen zu sammeln.

2.	Verwenden Sie die Datei in Trimble Geomatics Office, um die Kartiercodes zu verarbeiten und das Projekt für Attribute einzurichten, wenn Sie Attributinformation aufzeichnen.

Sie können unter Verwendung des Trimble Feature and Attribute Editor™-Programms Ihre eigenen Merkmals- und Attributbibliotheken erstellen. Weitere Informationen über die Erstellung von Merkmals- und Attributbibliotheken finden Sie in der Hilfe des Trimble Feature and Attribute Editor-Programms.


Current.csd-Datei

Die Datei Current.csd befindet sich im Ordner Programme\Gemeinsame Dateien\Trimble\Geodata.

Current.csd ist die Koordinatensystem-Datenbank für Trimble Geomatics Office. Diese Datei wird verwendet, wenn Sie ein Koordinatensystem für ein Projekt verwenden.

Verwenden Sie das Trimble Coordinate System Manager™-Programm, um diese Datei anzusehen und zu bearbeiten. Informationen über die Erstellung von Koordinatensystemen finden Sie in der Hilfe des Trimble Coordinate System Managers.


.frm-Dateien

Planrahmenmuster werden als .frm-Dateien gespeichert. Sie befinden sich im Ordner Programme\Trimble\Trimble Geomatics Office\System.

Wenn Sie die Blatt-Konfigurierung für das Ausdrucken oder Plotten durchführen, müssen Sie einen Planrahmen dafür wählen.

HINWEIS: Die .frm-Dateien sind Text-Dateien. Verwenden Sie einen Text-Editor, um sie anzusehen und zu bearbeiten.


Microsoft Access 2000

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank nur mit Trimble Geomatics Office. Trimble unterstützt oder autorisiert weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank mit anderen Software-Anwendungen. Trimble behält sich vor, das Format dieser Datenbank jederzeit ändern, wodurch sie inkompatibel mit anderen Software-Anwendungen werden würde.

Trimble Geomatics Office verwendet eine Microsoft Access 2000-Datenbank. Wenn Sie über eine ältere Version der Microsoft Access Software verfügen, können Sie die <Projekt>.mdb-Datei nicht öffnen. Wenn Sie über Microsoft Access 2000 (oder höher) verfügen, können Sie diese Software verwenden, um Ihre Projektdaten anzusehen und neue Abfragen zu erzeugen.


Datenbank-Abfragen - Überblick
Datenbank-Abfragen − Überblick

Weitere Informationen

 Wie kann ich ...

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank mit Trimble Geomatics Office. Trimble unterstützt oder autorisiert weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank mit anderen Software-Anwendungen. Trimble behält sich vor, das Format dieser Datenbank jederzeit ändern, wodurch sie inkompatibel mit anderen Software-Anwendungen werden würde.

Überblick

Trimble Geomatics Office verwendet eine Microsoft Access 2000-Datenbank. Sie können Microsoft Access verwenden, um Ihre eigenen Abfragen zu erzeugen.

HINWEIS: Trimble unterstützt keine benutzerdefinierten Abfragen.

Die nachstehenden Angaben enthalten begrenzte Informationen über den Entwurf von Abfragen zur Verwendung in Trimble Geomatics Office. Wenn Sie diese Methoden überprüfen möchten, sollten Sie die mit Microsoft Access gelieferte Dokumentation einsehen.

Microsoft Access-Abfragen definieren

Gewöhnlich können Sie die Abfragen, die Sie zur Definition in Projekten verwenden möchten, in den Projektvorlagen vordefinieren.

Sie können Abfrage-Definitionen in andere Microsoft Access-Datenbanken exportieren. Wenn in einem bestimmten Projekt daher nützliche Abfrage-Definitionen erzeugt wurden, können Sie diese Definitionen später in die Hauptprojektvorlage(n) exportieren, so daß diese in anderen Trimble Geomatics Office-Projekten verfügbar sind.

Der Schlüssel zu der Verwendung von Microsoft Access-Abfragen in Trimble Geomatics Office liegt darin, daß das/die in der Abfrage spezifizierte(n) ID-Feld(er) die Elementtypen definieren, die bei der Abfrage gewählt werden sollen.

Bei der Verwendung von ID-Feldern in einer Auswahlabfrage gelten die folgenden Bedingungen:

 Die Abfrage muß mit der ersten Ausgabespalte definiert werden (Wählen Sie das Kontrollkästchen “Anzeigen” für die Spalte aus), die ein ID-Feld oder eine ganze Tabelle ist (*-Option verwendet).

  Wenn die Abfrage so entworfen werden soll, daß mehrere Elementtypen (z. B. alle mit Bogenelementen assoziierten Punkte) gewählt werden, dann müssen die ID-Felder, die sich auf jedes der zu wählenden Elemente beziehen, die einzigen Ausgabefelder in der Abfrage sein.

Abfragen für Trimble Geomatics Office definieren

Wenn Sie eine Abfrage definieren möchten, die in Trimble Geomatics Office verwendet werden soll, müssen Sie die Abfragebezeichnung mit einem korrekten Präfix versehen, so daß die Abfrage in der erforderlichen Liste erscheint.

HINWEIS: In den Berichts- und Exportabfragen muß die Auswahlmengendatentabelle im Abfragenamen referenziert werden. Wenn Sie eine Punktliste exportieren möchten, sollte die Abfrage Export(Point)_Point List lauten.

Wenn Sie eine Abfrage für Auswahlzwecke erzeugen möchten und diese in der Liste Wählen / Nach Abfrage erscheinen soll, muß die Abfrage das Präfix Wählen_ aufweisen. Alle Abfragen mit einem Präfix Wählen_ sind auch verfügbar, wenn benutzerdefinierte Berichte erzeugt werden.

Wenn Sie eine Abfrage nur für Berichte entwerfen möchten, verwenden Sie das Präfix Bericht_(Selection Set data table)_  Abfragen mit einem Präfix Bericht_(Selection Set data table)_  erscheinen nicht in der Liste Wählen / Nach Abfrage.

Wenn Sie eine Abfrage hinzufügen möchten, um Elemente in der Auswahlliste des Eigenschaftsfensters herauszufiltern, verwenden Sie das Präfix SS_. Die Abfrage erscheint in der Liste, wenn Sie auf das Symbol Filter im Eigenschaftsfenster klicken.


Parameter an Abfragen in Microsoft Access weitergeben

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank nur mit Trimble Geomatics Office. Trimble unterstützt weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank mit anderen Software-Anwendungen. Trimble behält sich vor, das Format dieser Datenbank jederzeit ändern, wodurch sie inkompatibel mit anderen Software-Anwendungen werden würde.

Es ist möglich, Parameter als Teil der Abfrage-Definition mit der Microsoft Access Software festzulegen, damit dieselben benutzerdefinierten Abfragen für die Auswahl von verschiedenen Elementen zu unterschiedlichen Zeitpunkten verwendet werden können.

Wenn ein Parameter spezifiziert ist, können Sie in Trimble Geomatics Office den entsprechenden Wert eingeben, wenn mit der Abfrage begonnen wurde. Ein Beispiel für die Verwendung eines Parameters in einer Abfrage ist die Bereitstellung einer Abfrage zur Auswahl von Punktelementen nach ihrem Kartiercode.

Sie können z. B. alle Punkte mit dem Kartiercode ‘Baum’ zu einem bestimmten Zeitpunkt und dann alle Punkte mit dem Kartiercode ‘Pfahl’ zu einem späteren Zeitpunkt wählen.

Ein Parameter kann für eine Spalte in einer Abfrage-Definition spezifiziert werden, indem Sie die Aufforderungsmeldung, die zusammen mit der zu erfüllenden Vergleichsbedingung angezeigt werden soll (d.h. =, >, <, Like), in eckigen Klammern (d.h. []) in das Feld Kriterien eingeben.

Bei einer Abfrage für die Auswahl von Punkten nach ihrem Kartiercode muß z. B. das Feld Kartiercode zu der Abfrage-Definition hinzugefügt werden. Das Feld Kriterien muß die zu erfüllende Bedingung definieren, z. B.: "Like [Code]".

In diesem Beispiel wird der Like-Operator zum Vergleich von Zeichenfolgen verwendet, um nach übereinstimmenden Codes zu suchen.

Die Abfrageparameter können verfeinert werden. Sie können dann das Feld Parametereingabe in Trimble Geomatics Office ausfüllen, indem Sie auf Elemente in dem graphischen Modell klicken. Die Abfrage wird verfeinert, indem ein Doppelpunkt nach der Parameter-Eingabeaufforderung, und dann der Name des auszufüllenden Datenbank-Feldes eingegeben wird. Das obige Code-Beispiel würde dann so aussehen:
Like [Code:Kartiercode]

Zusätzlich zum Definitionsvorgang der Parameterbedingung im Feld Kriterien müssen Sie die Parameterdefinition auch in das Dialogfeld für die Abfrage eingeben. Das Dialogfeld erscheint im Verknüpfungsmenü, wenn sich der Zeiger in der oberen Hälfte des Abfragedialogfelds befindet.

HINWEIS: Das Feld Parameter muß genau den gleichen Text enthalten wie der, der in die eckigen Klammern des Feldes Kriterien eingegeben wurde.

Das zu jedem Parameter gehörende Feld Dateityp wird entsprechend des eingegebenen Dateityps eingestellt. Im obigen Beispiel wird es auf Text eingestellt, da der Kartiercode ein Texttyp-Feld ist. Wenn ein Parametertyp mit einer reellen Zahl, z. B. einer Punkthöhe angegeben wird, dann sollte das Feld Datentyp auf Doppelt eingestellt werden.

Die vorstehenden  Angaben enthalten nur begrenzte Informationen über den Entwurf von Abfragen zur Verwendung in Trimble Geomatics Office. Wenn Sie diese Methoden überprüfen möchten, sollten Sie die mit Microsoft Access gelieferte Dokumentation einsehen.


Benutzerdefinierte Abfragen verwenden, um eine Auswahlmenge zu filtern

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank nur mit Trimble Geomatics Office. Trimble unterstützt weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank mit anderen Software-Anwendungen. Trimble behält sich vor, das Format dieser Datenbank jederzeit ändern, wodurch sie inkompatibel mit anderen Software-Anwendungen werden würde.

Unter Verwendung von Microsoft Access können Sie komplexere Abfragen erzeugen, die mit der Auswahlmengendatentabelle arbeiten und mit der die Auswahlabfrage eine Datenbank-Auswahlmenge effektiv filtern kann.

Die Auswahlmengen-Tabelle enthält die Datensatz-IDs aller Elemente, die sich in jeder Auswahlmenge befinden.

Um diese Filterfunktion zu erreichen, muß die Auswahlmengendatentabelle in der Abfrage-Definition enthalten sein, zusammen mit der Tabelle, die die zu wählenden Elemente enthält (z. B. die Punktetabelle). In diesem Fall muß das Feld “Datensatz-ID” in der Auswahlmengentabelle mit dem entsprechenden ID-Feld in der anderen in der Abfrage enthaltenen Tabelle verbunden werden. Dieses Verbinden von Feldern aus zwei Tabellen erfolgt durch Ziehen und Ablegen des entsprechenden Feldnamens aus einer Tabelle in der anderen Tabelle.

Wie bereits bei den anderen Auswahl-Abfragen beschrieben, muß das erste angezeigte Feld in der Abfrage ein ID-Feld oder eine ganze Tabelle sein. Damit die Abfrage nur Elemente von einer spezifischen Tabelle wählt, muß die Abfrage den Namen der Tabelle definieren, die die aus der Auswahlmengendatentabelle zu wählenden Elemente enthält. Dies bedeutet, daß, wenn Punkte gewählt werden, das Feld Tabellenname zur Abfrage hinzugefügt werden muß, wobei die Kriterien auf ‘Punkt’ eingestellt sein müssen.

Die Auswahlmengentabelle enthält die Datensatz-IDs aller Elemente, in jeder Auswahlmenge. Jeder Auswahlmenge ist eine eindeutige Identifizierungsnummer zugeordnet, die in der Spalte Auswahlmenge-Name ID der aktuellen Auswahlmengendatentabelle aufgelistet ist. Die Nummer 0 weist darauf hin, daß das Element zur aktuellen Auswahlmenge gehört, so daß dieser Wert bei der Abfrage verwendet werden kann, um sicherzustellen, nur die aktuelle Auswahlmenge gefiltert wird. Dies erfolgt durch Hinzufügen einer weiteren Abfragespalte, die die Auswahlmengen-Namen ID definiert; das Feld Kriterien wird auf 0 gesetzt. Sie können eine aktuelle Auswahl, basierend auf einer bestehenden Auswahlmenge, treffen, indem Sie dieses Kriterium auf einen anderen Wert einstellen.

Die vorstehenden Angaben enthalten nur begrenzte Informationen über den Entwurf von Abfragen zur Verwendung in Trimble Geomatics Office. Wenn Sie diese Methoden überprüfen möchten, sollten Sie die mit Microsoft Access gelieferte Dokumentation einsehen.


Projektvorlagen - Überblick
Projektvorlagen − Überblick

Weitere Informationen

Wie kann ich...	Dialogfeld

Überblick

Wenn Sie ein neues Projekt erstellen, müssen Sie eine Vorlage wählen. Eine Vorlage enthält alle Einstellungen, Daten und Dateistrukturen. Die Informationen in der Vorlage werden in das Projekt kopiert, wenn Sie es erstellen. Wenn sich z. B. eine Survey Controller (*.dc)-Datei im Checkin-Ordner der Vorlage befindet, verfügt das Projekt über die gleiche .dc-Datei im entsprechenden Checkin-Ordner. Alle Bearbeitungen, die an dem Projekt vorgenommen wurden, werden nicht an der Vorlage durchgeführt.

Vorlagen sind nützlich, um:

  CAD-Stile zu wählen, die Sie verwenden möchten

  Festpunkte zu der Datenbank hinzuzufügen

  alle erforderlichen Dateien hinzuzufügen

  das entsprechende Koordinatensystem zu wählen

  die erforderlichen Einheiten zu wählen

  Einstellungen für doppelte Punkte zu wählen

Trimble liefert zusammen mit Trimble Geomatics Office eine Reihe von Vorlagen. Mit der metrischen Vorlage können Sie z. B. metrische Messungen in Projekten verwenden, die mit dieser Vorlage erstellt wurden.

Vorlagen werden im Ordner Programme\Trimble\Trimble Geomatics Office\Template gespeichert.


Befehl Bericht Neuberechnung

Verwenden Sie diesen Befehl, um den Neuberechnungsbericht anzusehen. Der Bericht wird von der zuletzt durchgeführten Neuberechnung der Vermessungsdaten erzeugt.

Wählen Sie hierzu Berichte / Bericht Neuberechnung.

Der Bericht wird im voreingestellten HTML-Anzeigemodul angezeigt.


System-Berichte - Überblick
System-Berichte − Überblick

 Siehe auch

System-Berichte werden im Anschluß an einen Verarbeitungsvorgang oder eine Berechnung von Vermessungsdaten erzeugt. Diese Berichte werden im Ordner Berichte erzeugt. Mit Ausnahme des Import-Berichts wird bei der Erzeugung eines neuen Berichts ein bestehender Bericht desselben Namens in dem Ordner überschrieben.

Die folgenden Berichte werden vom System nach einem Verarbeitungsvorgang automatisch erzeugt:

  Import-Bericht

  Neuberechnungsbericht

  Kartiercode-Verarbeitungsbericht

  Projekteinfügungsbericht

Wählen Sie die Option Erzeugten Bericht anzeigen im Dialogfeld Projekteigenschaften − Register Berichte, um über diese Berichte informiert zu werden.

Sie können die folgenden System-Berichte erzeugen, nachdem Sie einen Vermessungsvorgang durchgeführt haben. Diese Berichte enthalten Details über die Vermessungsberechnungen oder Änderungen an Vermessungsdaten.

  Neuberechnungsbericht

  Punktableitungsbericht

 GPS-Basislinienverarbeitungsbericht (wenn das WAVE Basislinienverarbeitungsmodul installiert ist)

  GPS-Schleifenschlußbericht

  Netzausgleichungsbericht (wenn das Netzausgleichungsmodul installiert ist)

  GPS-Kalibrierungsbericht

  Koordinatentransformationsbericht

  Höhenausgleichungsbericht

  Bericht Richtungswinkel/Strecke

  Bericht Punkte umbenennen

  Nivellier-Bericht

HINWEIS: Die Verfügbarkeit einiger Berichte ist davon abhängig, welche Module (Basislinienverarbeitung oder Netzausgleichung) installiert sind.


Datenbank-Berichte - Überblick
Datenbank-Berichte − Überblick

 Siehe auch

Datenbank-Berichte sind Berichte, die Sie von den in der Datenbank definierten primären Tabellen-Datensätzen und Abfragen erzeugen. Das bedeutet, daß Berichte über Informationen aus der Projektdatenbank erstellt werden.

Diese Berichte sind von Nutzen, wenn Sie eine Zusammenfassung des Projekts erstellen oder Kunden Berichte vorlegen möchten.

Datenbank-Berichte sind in zwei Kategorien aufgeteilt:

  System-Datenbank-Berichte

  Benutzerdefinierte Berichte

Auf beide Berichte kann im Dialogfeld Zusätzliche Berichte zugegriffen werden.

Sie können einen bestehenden Datenbank-Bericht, der von Trimble Geomatics Office erstellt wurde, verwenden oder modifizieren, oder Sie können Ihr eigenes Berichtsformat anpassen.


Berichte - Überblick
Berichte − Überblick

Trimble Geomatics Office erzeugt alle Berichte im HyperText Markup Language (HTML)-Format. Sie werden im HTML-Anzeigemodul auf Ihrem Computer angezeigt. Das voreingestellte HTML-Anzeigemodul ist normalerweise ein Web-Browser.

Alle Berichte werden in dem Ordner Reports in Trimble Geomatics Office\Verzeichnis Projekte erzeugt. Die Berichte werden zusammen mit dem Namen des Berichtstyps in Ordner aufgeteilt. Mit Ausnahme des Import-Berichts und des Netzausgleichungsberichts überschreibt ein neuer Bericht, wenn dieser erzeugt wird, alle bestehenden Berichte desselben Namens in dem Ordner.

Es können zwei Berichtstypen erzeugt werden:

  System-Berichte

  Datenbank-Berichte

Auf häufig verwendete Berichte kann von dem Menü Berichte aus zugegriffen werden. Die Verfügbarkeit einiger System-Berichte ist davon abhängig, welche Module (Basislinienverarbeitungsmodul und Netzausgleichungsmodul) installiert sind, und ob bereits ein Bericht erzeugt wurde.

HINWEIS: Die Trimble Geomatics Office-Berichte können nicht im Microsoft Internet Explorer Version 2 oder 3 angesehen werden. Wenn Sie über eine dieser Versionen verfügen, empfiehlt Trimble, daß Sie die Web-Version 4 oder 5 des Microsoft Internet Explorers installieren.


Microsoft Internet Explorer Web-Browser - Berichtsanzeige
Microsoft Internet Explorer Web-Browser − Berichtsanzeige

Der Microsoft Internet Explorer Web-Browser ist im Internet erhältlich, wenn kein HTML-Anzeigemodul auf Ihrem Computer installiert ist. Mit dem Microsoft Internet Explorer Web-Browser können Sie den erzeugten Bericht ansehen und ausdrucken. Sie können die anderen, für Sie nützlichen Funktionen des Microsoft Internet Explorers entsprechend Ihren Berichtserfordernissen einsetzen.

Die Darstellung des Berichts anpassen

Trimble Geomatics Office-Berichte werden in einem standardisierten Format angezeigt. Die Schriftarten, Schriftgrößen, Farben und Hintergründe sind in allen Berichten dieselben. Sie können diese Einstellungen mit Ihren eigenen Voreinstellungen überschreiben. Führen Sie dies durch, wenn Sie den Bericht in einem Format darstellen möchten, das für Sie leichter zu lesen ist.

TIP: Ersetzen Sie die Datei backgrnd.gif mit einer anderen CompuServe Graphics Interchange (GIF)-Graphikdatei desselben Namens im Ordner Reports, um den Hintergrund des Berichts zu ändern.

Sie können Ihre Druckoptionen so einstellen, daß der Berichthintergrund nicht gedruckt wird. Gemäß Voreinstellung ist diese Option ausgeschaltet.

Den Bericht in einer anderen Software-Anwendung öffnen

Viele Software-Anwendungen unterstützen Dokumente in HTML-Format. Zusätzlich können Sie den Bericht als Text (*.txt)-Datei speichern, damit diese in einer anderen Anwendung, z. B. einem Text-Editor, einem Tabellenkalkulations- oder Textverarbeitungsprogramm geöffnet werden kann. Sie können eine Auswahl des Berichts zudem in die Zwischenablage kopieren und dann in eine andere Software-Anwendung einfügen.

Diese Funktionen können von Nutzen sein, wenn Sie den Bericht in ein Dokument einfügen, den Inhalt des Berichts bearbeiten oder die Daten verwenden möchten, um weitere Berechnungen in einer anderen Anwendung durchzuführen.

Information über die Verwendung der Microsoft Internet Explorer-Funktionen für Berichte finden Sie in der Internet Explorer-Hilfe.


Dialogfeld Berichtsformat definieren

Verwenden Sie dieses Dialogfeld, um ein Berichtsformat in Zusätzliche Berichte / Benutzerdefinierte Berichte zu definieren.

So greifen Sie darauf zu:

1.	Wählen Sie Berichte / Zusätzliche Berichte. Das Dialogfeld Zusätzliche Berichte erscheint.

2.	Führen Sie einen der folgenden Vorgänge aus:

  Klicken Sie auf Neu, um ein neues Berichtsformat zu definieren.

  Wählen Sie ein bestehendes Berichtsformat aus der Liste Berichte, und klicken Sie auf Bearbeiten, um das gewählte Format zu modifizieren.

HINWEIS: Sie können die Punkte, Höhenbereiche, Koordinatensystemdetails oder Punktvergleichsberichte nicht bearbeiten.

Name

Geben Sie den Namen des Berichtsformats ein. Dieser Name erscheint in der Liste Berichte des Dialogfelds Benutzerdefinierte Berichte. Doppelte Namen sind nicht zulässig.

Null-String

Der Null-String zeigt den Null-String an, der unter Datei / Projekteigenschaften / Register Einheiten und Format festgelegt wurde. Der in diesem Feld angegebene String wird in den Feldern des erzeugten benutzerdefinierten Berichts verwendet, deren Wert Null ist. Dieses Feld ist optional.

Beschreibung

Sie können eine Beschreibung des Berichtsformats in das Feld Beschreibung eingeben. Diese Beschreibung erscheint in der Statusleiste. Dieses Feld ist optional.

Standard-Erweiterung

Die Standard-Erweiterung wird in der Definition eines Berichtsformats nicht verwendet.

Bericht über

Wählen Sie eine der primären Tabellen oder Abfragen als Quelle für den Bericht aus. Die voreingestellte Quelle ist der Punktinformations-Datensatz. Mit dieser Voreinstellung können Sie über jeden Datensatz in der Punktetabelle berichten.

Format automatisch ausfüllen

Klicken Sie auf Format automatisch ausfüllen, um den Formatkopf und Formatinhalt automatisch zu initialisieren. Weitere Informationen finden Sie unter Format automatisch ausfüllen.

Formatkopf

Geben Sie den konstanten Text und alle Feldcode-Definitionen (im Verknüpfungsmenü verfügbar) ein, die die Berichtskopfzeile bilden. Dieses Feld ist optional und benötigt keine Definitionsangabe.

Drücken Sie die Taste Eingabe, um Leerzeilen zur Kopfdefinition hinzuzufügen.

Formatinhalt

Geben Sie die entsprechenden Feldcode-Definitionen (im Verknüpfungsmenü verfügbar) ein, um anzugeben, über welche Projektdaten Trimble Geomatics Office berichten soll.

Verwenden Sie z. B. für einen Bericht, der Punkte mit konstanter Breite enthält, das folgende Format:

[Name:10][Erste Ordinate:14.3][Zweite Ordinate:14.3][Höhe:14.3][Kartiercode:20]

Das Feld Formakopf oder -inhalt (aber nicht beide zugleich) können leer bleiben.

Formatfußzeile

Geben Sie den konstanten Text und alle Feldcode-Definitionen (im Verknüpfungsmenü verfügbar) ein, die die Berichtsfußzeile bilden. Dieses Feld ist optional und benötigt keine Definitionsangabe. Verwenden Sie diese Fußzeile zum Beispiel, um einen EOF-Befehl (Befehl Dateiende) anzuzeigen.

Betätigen Sie die Taste Eingabe, um Leerzeilen zu der Fußzeilendefinition hinzuzufügen.

Weitere Informationen über alle im System verfügbaren Feldcodes finden Sie unter Feldcodes − Überblick.


Neuberechnungsbericht - Überblick
Neuberechnungsbericht − Überblick

Der Neuberechnungsbericht ist ein HyperText Markup Language (HTML)-Bericht, der die Ergebnisse des Neuberechnungsvorgangs zusammenfaßt. Verwenden Sie den Neuberechnungsbericht, um Warnkennzeichnungen zu eliminieren, indem Sie:

  Besetzungsdetails überprüfen

  überprüfen, ob Punkte korrekt benannt wurden

  die Koordinate deaktivieren, wenn Sie glauben, daß die Koordinate falsch eingegeben wurde

  die Beobachtung erneut durchführen, falls erforderlich

Der Neuberechnungsbericht berichtet über das folgende:

  Toleranzfehler, wenn mehrere Beobachtungen oder Positionskoordinaten außerhalb der Toleranz liegen. (Toleranzen werden im Register Neu berechnen des Dialogfelds Projekteigenschaften definiert).

  Abschlüsse, wenn mehr als eine Beobachtung oder ein Satz eingegebener Koordinaten zur Positionsbestimmung verwendet werden könnte, und sich die Positionen innerhalb der Toleranz befinden.

  Unbenutzte Beobachtungen und Fehler.

  Startkoordinaten und die Reihenfolge, in der die Koordinaten abgeleitet wurden.

  Beobachtungen und Koordinaten, auf die im Bericht Bezug genommen wird.

Trimble Geomatics Office erzeugt einen Neuberechnungsbericht jedesmal, wenn eine Neuberechnung durchgeführt wird. Wie Sie darüber benachrichtigt werden, daß ein Neuberechnungsbericht erzeugt wurde, ist von dem Feld Erzeugten Bericht anzeigen im Register Berichte des Dialogfelds Projekteigenschaften abhängig. Der Neuberechnungsbericht wird immer im Ordner Reports für das Projekt gespeichert. Wie bei allen System-Berichten wird der vorhergehende Bericht von dem neuen Bericht überschrieben, wenn bereits ein Bericht existiert.

Der Neuberechnungsbericht enthält die folgenden Bestandteile:

  Projektdetails

  Fehler

  Warnungen

  Abschlüsse

  Punktableitungen

  Startpunkte

  Polygonzug-Bericht

  Vermessungsdaten (Beobachtungen und Koordinaten)


Neuberechnungsbericht - Abschnitt Projektdetails
Neuberechnungsbericht − Abschnitt Projektdetails

Der Abschnitt Projektdetails des Neuberechnungsberichts faßt den Projektnamen und die Koordinatensystem-Details zusammen.


Neuberechnungsbericht - Abschnitte Fehler und Warnungen
Neuberechnungsbericht − Abschnitte Fehler und Warnungen

Die Abschnitte Fehler und Warnungen des Neuberechnungsberichts listen alle Punkte auf, bei denen mehr als ein Satz Koordinaten für einen Punkt abgeleitet wurde und die Koordinaten außerhalb der Toleranz liegen. Sie zeigen zudem an, welche Beobachtungen nicht verwendet werden und welche Punkte nicht koordiniert werden können.

Verwenden Sie diese Abschnitte, um die Fehler und Warnungen zu überprüfen, und entscheiden Sie sich, ob Sie das Projekt bearbeiten möchten. Um die Ableitung eines Punktes anzusehen, klicken Sie auf den Punkt. Sie gelangen zum Abschnitt Punktableitungen.

Die horizontalen und vertikalen Toleranzen werden ebenfalls angezeigt. Sie werden im Dialogfeld Projekteigenschaften − Register Neu berechnen eingestellt.


Neuberechnungsbericht - Abschnitt Punktableitung
Neuberechnungsbericht − Abschnitt Punktableitungen

Der Abschnitt Punktableitungen des Neuberechnungsbericht zeigt die berechnete Position für einen Punkt an. Die Punktableitungen werden nur für im Bericht enthaltene Punkte mit Fehlern oder Abschlüssen angezeigt. Die Qualitäten der horizontalen (Hochwert, Rechtswert) Komponente, Höhenkomponente und ellipsoidischen Höhenkomponente für die berechnete Position werden angezeigt.

Unterhalb der berechneten Position und der Qualitäten befindet sich eine Liste der Vermessungsdaten, die zur Punktkoordinierung verwendet werden könnten.

Für jede Beobachtung wird folgendes angezeigt:

  der Beobachtungstyp

  die Beobachtungs-ID

  die ‘Von’- und ‘Zu’-Punkte

Um die Beobachtungsdetails anzusehen, klicken Sie auf die ID. Diese ist mit dem Abschnitt Vermessungsdaten des Neuberechnungsberichts verknüpft.

Wählen Sie das Symbol links neben der Beobachtungs-ID, um die Beobachtung im Graphikfenster (und im Eigenschaftsfenster) auszuwählen. So können Sie in der Vermessungsansicht Beobachtungen, deren Abschlüsse außerhalb der Toleranz liegen, einfach erkennen.

Für jede Koordinate wird folgendes angezeigt:

  der Koordinatentyp (Gitter, Geodätisch oder Positionslösung)

  die Quelle der Koordinate

  die Koordinaten-ID

Um die Koordinatendetails anzusehen, klicken Sie auf die ID. Diese ist mit dem Abschnitt Vermessungsdaten des Neuberechnungsberichts verknüpft.

Wählen Sie erneut das Symbol links neben der Beobachtungs-ID, um den Punkt im Graphikfenster und im Eigenschaftsfenster zu wählen.

Die Spalte Zur Berechn. verwendet zeigt an, welche Positionskomponenten (H,R,h,ellh) aus der Beobachtung oder Koordinate berechnet wurden. Wenn eine Beobachtung z. B. die Hochwert-, Rechtswert- und Ellipsoidhöhenkomponenten für den Punkt bestimmt, und die Koordinate die Höhe bestimmt, erscheint in der Spalte Zur Berechn. verwendet H, R,ellh neben der GPS-Beobachtung und h neben der Koordinate.

Die Spalten Delta Ho, Delta Re, Delta Höhe und Delta Ellips. Höhe zeigen den Unterschied zwischen der letzten berechneten Position und der mit der Beobachtung oder Koordinate berechneten Position an.

Wenn sich die Delta-Werte über der für das Projekt konfigurierten Toleranzeinstellung befinden, erscheinen Kennzeichnungen. Zahlen werden rot angezeigt. Rot gekennzeichnete Beobachtungen weisen nicht notwendigerweise auf eine falsche Beobachtung oder eingegebene Koordinaten hin— bei der Neuberechnung kann möglicherweise eine fehlerhafte Beobachtung oder ein Satz eingegebener Koordinaten verwendet worden sein. Sie sollten die Fehlerursache feststellen und alle fehlerhaften Beobachtungen deaktivieren.

Verwenden Sie den Vermessungsabschnitt des Berichts, um jede Beobachtung zu überprüfen.

TIP: Sie können das Eigenschaftsfenster und Berichte / Befehl Bericht Punktableitung verwenden, um den Ableitungsbericht für jeden Punkt im Projekt einzusehen, einschließlich der Punkte, die nicht im Neuberechnungsbericht enthalten sind.


Neuberechnungsbericht - Abschnitt Polygonzug-Bericht
Neuberechnungsbericht − Abschnitt Polygonzug-Bericht

Der Abschnitt Polygonzug-Bericht des Neuberechnungsbericht zeigt, wie bei der Neuberechnung vom Startpunkt ein Polygonzug durchgeführt wird. Der Abschnitt zeigt die Beobachtungen an, die dabei verwendet werden.

Nur Polygonzüge, die vom Startpunkt aus gesehen mehr als einen Beobachtungsabschnitt enthalten, werden im Bericht angezeigt, damit keine Offsets im Bericht enthalten sind.

Wenn Beobachtungen z. B.:

  von Startpunkt 1 − zu Punkt 2 − zu Punkt 3 und dann zurück zu Punkt 1 durchgeführt wurden, wird dies angezeigt.

  von Startpunkt 1 − zu Punkt 2 durchgeführt wurden, wird dies nicht angezeigt.


Neuberechnungsbericht - Abschnitt Abschlüsse
Neuberechnungsbericht − Abschnitt Abschlüsse

Der Abschnitt Abschlüsse des Neuberechnungsbericht enthält die Liste der Stationspunkte mit mehreren Beobachtungen zu einem Punkt, die innerhalb der für das Projekt festgelegten Toleranz liegen. Die Abschlüsse von allen Vermessungsdaten für den Punkt werden in den Spalten Delta Ho, Delta Re, Delta Höhe und Ellips Höhe angezeigt.

Klicken Sie auf einen Punkt, um die Ableitungsdetails anzusehen. Die Punkte sind mit dem Abschnitt Punktableitungen verknüpft.


Neuberechnungsbericht - Abschnitt Startpunkte
Neuberechnungsbericht – Abschnitt Startpunkte

Der Abschnitt Startpunkte des Neuberechnungsbericht enthält die Punkte, von denen bei der Neuberechnung der Beobachtungsfluß ausging.


Neuberechnungsbericht - Abschnitt Vermessungsdaten
Neuberechnungsbericht − Abschnitt Vermessungsdaten

Im Abschnitt Vermessungsdaten werden alle Beobachtungen und Koordinaten der Punkte im Neuberechnungsbericht angezeigt. Die Vermessungsdaten sind nach Beobachtungstyp organisiert. Verwenden Sie diesen Abschnitt, um zu bestimmen, ob es inkorrekte Beobachtungen gibt.

Nur Beobachtungen und Koordinaten, die im Neuberechnungsbericht enthalten sind, sind in diesem Abschnitt aufgelistet.

Sie können alle Vermessungsdaten im Eigenschaftsfenster ansehen.


Neuberechnungsbericht - Zusätzliche Koordinatensystemdetails
Neuberechnungsbericht − Zusätzliche Koordinatensystemdetails

Der Abschnitt Zusätzliche Koordinatensystemdetails enthält Informationen über die Einstellungen für die örtliche Anpassung.

HINWEIS: Die Einstellungen für die örtliche Anpassung werden im Dialogfeld Projekteigenschaften − Register Koordinatensystem festgelegt.


Befehl Bericht Punktableitung

Verwenden Sie diesen Befehl, um den Punktableitungsbericht für den/die gewählten Punkt(e) anzusehen.

So greifen Sie darauf zu:

1.	Wählen Sie den/die Punkt(e), die Sie ansehen möchten.

2.	Wählen Sie Berichte / Bericht Punktableitung.

Der Punktableitungsbericht wird im voreingestellten HTML-Anzeigemodul angezeigt.


Punktableitungsbericht

Der Punktableitungsbericht ist ein Abschnitt des Neuberechnungsbericht, in dem die berechnete Position für einen Punkt angezeigt wird. Die Qualitäten der horizontalen (Hochwert, Rechtswert) Komponente, Höhenkomponente und ellipsoidischen Höhenkomponente für die berechnete Position werden gezeigt.

Das Format des Berichts ist dasselbe wie im Abschnitt Punktableitungen des Neuberechnungsberichts.

So greifen Sie auf den Bericht zu:

1.	Wählen Sie den/die Punkt(e), den/die Sie ansehen möchten.

2.	Führen Sie einen der folgenden Vorgänge aus:

  Wählen Sie Berichte / Bericht Punktableitung.

  Öffnen Sie das Eigenschaftsfenster / Register Vermessung / Seite Zusammenfassung, und wählen Sie das Symbol Punktableitung [image].

Der Bericht wird im voreingestellten HTML-Anzeigemodul angezeigt.

HINWEIS: Klicken Sie auf das Punkt- oder Beobachtungssymbol links neben der ID, um einen Punkt in der Vermessungsansicht zu wählen. Dies ist nützlich, um eine Verbindung zum Punkt in der Vermessungsansicht herzustellen.


Befehl Bericht Richtungswinkel/Strecke

Verwenden Sie diesen Befehl, um den letzten Bericht über Richtungswinkel/Strecke anzusehen, der im Dialogfeld RIWI/Strecke nach der Berechnung von Richtungswinkel/Strecke erzeugt wurde.

So greifen Sie darauf zu:

  Wählen Sie Berichte / Bericht Richtungswinkel/Strecke.

Der Bericht wird im voreingestellten HTML-Anzeigemodul angezeigt.


Bericht Richtungswinkel/Strecke

Der Bericht Richtungswinkel/Strecke kann im Anschluß an eine Berechnung von Richtungswinkel/Strecke erzeugt werden und zeigt kurze, detaillierte oder kombinierte Informationen über Richtungswinkel/Strecke an.

Der kurze Bericht Richtungswinkel/Strecke zeigt den Gitternetz-Azimut, die Gitterstrecke und den Höhenunterschied zwischen den “Von”- und “Zu”-Punkten an, die zur Definition von Richtungswinkel/Strecke verwendet wurden.

Der detaillierte Bericht Richtungswinkel/Strecke zeigt die Positionen der “Von”- und “Zu”-Punkte im Gitter-, örtlichen (geodätischen) und kartesischen (WGS-84) Koordinatensystem und die berechneten Richtungswinkel/Strecke-Parameter an.

Verwenden Sie das Dialogfeld RIWI/Strecke, um den Bericht zu erzeugen.

Nachdem ein Bericht erzeugt worden ist, können Sie den zuletzt erzeugten Bericht jederzeit ansehen, indem Sie Berichte / Bericht Richtungswinkel/Strecke wählen.


Bericht Punkte umbenennen

Der Bericht Punkte umbenennen ist ein Bericht, den Sie erzeugen können, um die ursprünglichen und neuen Namen der Punkte anzuzeigen, die mit dem Befehl Punkte umbenennen umbenannt wurden.

Verwenden Sie das Dialogfeld Umbenennen, um den Bericht zu erzeugen.


Import-Berichte

Jedesmal, wenn eine Datei in ein Projekt übertragen wird, erzeugt Trimble Geomatics Office einen Import-Bericht für jede importierte Datei. Dieser erhält den Namen <importierter Dateiname>.html. Er enthält die folgenden Abschnitte:

Projektdetails

Dieser Abschnitt faßt den Projektnamen und die Koordinatensystem-Details zusammen.

Meldungen

Dieser Abschnitt listet alle Meldungen auf, die beim Importieren erzeugt wurden. Wenn beim Importieren keine Meldungen auftreten, wird dieser Abschnitt nicht angezeigt.

Neuberechnungsbericht

Der Bericht enthält eine Verknüpfung zum Neuberechnungsbericht, die nach dem Importvorgang automatisch erzeugt wird. Der Neuberechnungsbericht faßt die Resultate des Neuberechnungsvorgangs zusammen.

Bericht Kartiercode-Verarbeitung

Der Bericht schließt eine Verknüpfung zum Kartierkodierungsbericht ein, wenn Kartiercodes beim Importieren verarbeitet wurden.

HINWEIS: Wenn die Verknüpfungen für den Neuberechnungsbericht oder Kartiercode-Verarbeitungsbericht eine rote Farbgebung aufweisen, weist dies darauf hin, daß während des Vorgangs Fehler entdeckt wurden und in den Berichten angezeigt werden.

Ein Bericht ″Importierte Dateien″ mit der Bezeichnung Import.html wird ebenso während des Importvorgangs erzeugt. Dieser Bericht enthält alle Dateien, die in das Projekt importiert wurden. Alle Dateien, die während einer anderen Sitzung in das Projekt importiert wurden, werden automatisch zu diesem Bericht hinzugefügt.

Wie Sie über diese Berichte informiert werden, wird von der Option Erzeugten Bericht anzeigen im Dialogfeld Projekteigenschaften − Register Berichte bestimmt.


Befehl Zusätzliche Berichte

Verwenden Sie diesen Befehl, um von Trimble Geomatics Office zur Verfügung gestellte System-Datenbank-Berichte oder benutzerdefinierte Berichte zu erzeugen.

Wählen Sie hierzu Berichte / Zusätzliche Berichte. Das Dialogfeld Zusätzliche Berichte erscheint.


Dialogfeld Zusätzliche Berichte

Verwenden Sie dieses Dialogfeld, um von Trimble Geomatics Office zur Verfügung gestellte System-Datenbank-Berichte oder benutzerdefinierte Berichte zu erzeugen.

System-Datenbank-Berichte

System-Datenbank-Berichte sind vordefinierte Berichtsformate, die eine Zusammenfassung des aktuellen Projekts enthalten. Die Berichte selbst können nicht bearbeitet werden, Sie können allerdings die Berichtsformate bearbeiten. Bearbeiten Sie dazu die Datei Asciirpt.dat. Sie befindet sich im Ordner Programme\Trimble\Trimble Geomatics Office\System.

Benutzerdefinierte Berichte

Für benutzerdefinierte Berichte werden die Hauptdatensatztypen oder Abfragen verwendet, die Sie in der Datenbank definiert haben.

Sie können ein benutzerdefiniertes Berichtsformat erstellen, definieren und bearbeiten. Sie können diese Berichtsformate auch mit einem Schreibschutz versehen, indem Sie die Datei Asciirpt.dat im Ordner Programme \Trimble\Trimble Geomatics Office\System bearbeiten.

Wenn hinter dem Namen des auszuführenden Berichtsformats ein Auslassungszeichen (…) steht, müssen Sie zuerst bestimmte Informationen erneut eingeben. Wenn Sie z. B. einen Bericht über orthometrische Höhen erstellen möchten, fordert Sie Trimble Geomatics Office auf, eine minimale und eine maximale Höhe einzugeben.

Bericht über

Es stehen zwei Optionen zur Verfügung, um über ausgewählte Elemente oder Datensatz-Typen zu berichten:

Auswahl	Wählen Sie diese Option, um über ausgewählte Elemente oder Datensatz-Typen zu berichten.
Ganze Datenbank	Wählen Sie diese Option, um über alle Elemente oder Datensatz-Typen zu berichten.
Wenn nichts ausgewählt ist, sind diese Schaltflächen nicht verfügbar, und es wird über alle Elemente oder Datensatz-Typen berichtet.

HINWEIS:  Wenn der Bericht Koordinatensystemdetails gewählt ist, steht diese Option nicht zur Verfügung.

Daten sortieren

Sie können die Anzeigereihenfolge der Daten im Bericht festlegen.

Um dies zu tun:

1.	Wählen Sie das Kontrollkästchen Daten sortieren.

2.	Wählen Sie eine Sortierreihenfolge aus der Liste. Sie können sortieren nach:

Datenbankreihenfolge	Höhe
Namen	Qualität
Startzeit	Datentyp
Länge der Besetzung
HINWEIS: Dieselben Sortieroptionen stehen im Eigenschaftsfenster zur Verfügung.

TIP: Wenn Sie eigene Sortier abfragen erstellen, werden diese ebenfalls in dieser Liste angezeigt

Berichte

Die Gruppe Berichte enthält eine Liste mit den System-Datenbank- und benutzerdefinierten Berichten. Trimble Geomatics Office verfügt über eine Reihe vordefinierter Berichte.

OK

Erstellt den Bericht und zeigt ihn im voreingestellten HTML-Anzeigemodul an.

Neu

Erstellt und definiert ein neues Berichtsformat.

Bearbeiten

Ändert ein bestehendes Berichtsformat.

Löschen

Löscht einen Bericht. Sie werden aufgefordert, das Löschen zu bestätigen.

HINWEIS: Die Abstandswerte, die Sie eingeben, werden nach Datenbank-Koordinateneinheiten und nicht nach aktuellen Anzeige-Einheiten interpretiert. Die Datenbankeinheiten basieren auf den Anzeige-Einheiten, die zu dem Zeitpunkt eingestellt waren, an dem die ersten Daten in der Datenbank gespeichert wurden.

TIP: Sie können diese Berichte modifizieren, indem Sie die Datei Asciirpt.dat in Programme\Trimble\Trimble Geomatics Office\Systemordner unter Verwendung eines Text-Editors bearbeiten.


  Befehl Bericht GPS-Kalibrierung

Verwenden Sie diesen Befehl, um den letzten GPS-Kalibrierungsbericht anzusehen, der im Dialogfeld GPS-Kalibrierung im Anschluß an eine Kalibrierungsberechnung erzeugt wurde.

Wählen Sie hierzu Berichte / Bericht GPS-Kalibrierung.

Der Bericht wird im voreingestellten HTML-Anzeigemodul angezeigt.

HINWEIS: Dieser Befehl ist nicht in der Vermessungsansicht verfügbar.

Klicken Sie auf Bericht im Dialogfeld GPS-Kalibrierung, um den Bericht in der Vermessungsansicht zu erzeugen.


GPS-Kalibrierungsbericht

Der GPS-Kalibrierungsbericht wird nach einer Kalibrierungsberechnung erzeugt. Er zeigt alle berechneten Parameter sowie eine Liste der berechneten Punktpositionen verglichen mit den bekannten Positionen und individuellen Restwerten an.

Verwenden Sie das Dialogfeld GPS-Kalibrierung, um den Bericht zu erzeugen.


Befehl Bericht Koordinatentransformation

Verwenden Sie diesen Befehl, um den letzten Koordinatentransformationsbericht anzusehen, der im Dialogfeld Koordinatentransformation im Anschluß an eine Transformationsberechnung erzeugt wurde.

Wählen Sie hierzu Berichte / Bericht Koordinatentransformation.

Der Bericht wird im Microsoft Internet Explorer angezeigt.

HINWEIS: Dieser Befehl ist in der Vermessungsansicht nicht verfügbar. Aktivieren Sie das Kontrollkästchen Den Koordinatentransformationsbericht erzeugen im Dialogfeld Koordinatentransformation, um den Bericht in der Vermessungsansicht zu erzeugen.


Koordinatentransformationsbericht

Der Koordinatentransformationsbericht wird nach einer Koordinatentransformation erzeugt und zeigt die ursprünglichen und berechneten Koordinaten an.

Verwenden Sie das Dialogfeld Koordinatentransformation, um den Bericht zu erzeugen.

Nachdem ein Bericht erstellt worden ist, können Sie den zuletzt erzeugten Bericht jederzeit ansehen, indem Sie in der Planansicht Berichte / Bericht Koordinatentransformation wählen.


Befehl Bericht Höhenausgleichung

Verwenden Sie diesen Befehl, um den letzten Höhenausgleichungsbericht anzusehen, der im Dialogfeld Höhenausgleichung nach einer Ausgleichung erzeugt wurde.

Wählen Sie hierzu Berichte / Bericht Höhenausgleichung.

Der Bericht wird im voreingestellten HTML-Anzeigemodul angezeigt.

HINWEIS: Dieser Befehl ist in der Vermessungsansicht nicht verfügbar. Aktivieren Sie das Kontrollkästchen Den Höhenausgleichungsbericht erzeugen im Dialogfeld Höhenausgleichung, um den Bericht in der Vermessungsansicht zu erzeugen.


Höhenausgleichungsbericht

Der Höhenausgleichungsbericht wird nach einer Höhenausgleichung erzeugt und zeigt die ursprünglichen und berechneten Koordinaten an.

Verwenden Sie das Dialogfeld Höhenausgleichung, um den Bericht zu erzeugen.

Nachdem ein Bericht erstellt worden ist, können Sie den zuletzt erzeugten Bericht jederzeit ansehen, indem Sie in der Planansicht Berichte / Bericht Höhenausgleichung wählen.


Kartiercode-Verarbeitungsbericht

Der Kartiercode-Verarbeitungsbericht wird im Anschluß an einen Kartiercode-Verarbeitungsvorgang erzeugt.

Durch die Einstellung der Option Erzeugten Bericht anzeigen im Dialogfeld Projekteigenschaften − Register Berichte werden Sie darüber informiert, wenn dieser Bericht erzeugt wird.

Der Bericht faßt den Verarbeitungsvorgang zusammen, und enthält Details über die verwendete Merkmals- und Attributbibliothek (.fcl)-Datei und alle Probleme, die bei der Kartiercode-Verarbeitung entdeckt wurden.


Projekteinfügungsbericht

Der Projekteinfügungsbericht wird erzeugt, nachdem Punkte kopiert und in ein Projekt eingefügt wurden.

Durch die Einstellung der Option Erzeugten Bericht anzeigen im Dialogfeld Projekteigenschaften − Register Berichte werden Sie darüber informiert, wenn dieser Bericht erzeugt wird.

Der Bericht faßt alle Merkmale, die einem kopierten Punkt zugeordnet wurden zusammen und nicht eingefügt werden, wenn die Attributdefinitionen zwischen den Projekten unterschiedlich sind.


Befehl Nivellier-Berichte

Verwenden Sie diesen Befehl, um einen Nivellier-Bericht für die ausgewählte Datei zu erstellen.

So greifen Sie darauf zu:

1.	Wählen Sie Berichte / Nivellier-Berichte.

2.	Wählen Sie die Nivellier-Datei.

Der Nivellier-Bericht für die gewählte Nivellier-Datei wird im voreingestellten HTML-Anzeigemodul angezeigt.


Nivellier-Bericht

Der Nivellier-Bericht enthält die Nivellierbeobachtungen und Nivellierdaten der Nivellier-Datei.

So greifen Sie auf den Bericht zu:

1.	Wählen Sie Berichte / Nivellier-Berichte.

2.	Wählen Sie die Nivellier-Datei.

Der Bericht wird im HTML-Anzeigemodul angezeigt. Er enthält folgende Informationen:

Nivellierdaten

Dieser Abschnitt enthält das Nivellement im Nivellier-Feldbuch-Format. Er enthält die Rückblick-, Zwischenblick- und Vorblick-Beobachtungen sowie die berechneten orthometrischen Höheninformationen, die im Dialogfeld Digitales Nivellier importieren angezeigt wurden.

Nivellierbeobachtungen

Die Tabelle Nivellierbeobachtungen enthält folgende Informationen:

  ID

  Von Punkt

 Zu Punkt

  Qualität

  Δ Höhe − diese Werte werden zwischen den Standpunkten berechnet.

TIP: Wählen Sie die Beobachtungs-ID, um die Nivellierbeobachtung im Graphikfenster anzuzeigen. Auf diese Weise können Sie die Nivellierbeobachtung einfach im Eigenschaftsfenster ansehen.

HINWEIS: Der Nivellier-Bericht wird im Ordner <Projektname>\Reports\Nivellier gespeichert.


Befehl Alles

Verwenden Sie diesen Befehl, um alle Elemente im aktuellen Projekt auszuwählen.

Wählen Sie hierzu Wählen / Alles.

Vermessungsansicht

Wenn Sie in der Vermessungsansicht arbeiten, sind alle sichtbaren Elemente ausgewählt.

Beispiel: Wenn Sie den Befehl Ansicht / Filter verwenden, um einige Beobachtungen auszublenden, und dann den Befehl Wählen / Alles verwenden, werden die ausgeblendeten Beobachtungen nicht ausgewählt.

Planansicht

Wenn Sie in der Planansicht arbeiten, werden alle Elemente ausgewählt, die sich in einem Layer befinden:

  dessen Eigenschaft Sichtbar eingeschaltet ist

  dessen Eigenschaft Gesperrt ausgeschaltet ist.

Beispiel: Wenn Sie das Symbol Layer-Auswahl verwenden [image],
um die Eigenschaft Gesperrt eines Layers auszuschalten, und dann den Befehl Wählen / Alles verwenden, werden keine Elemente in dem gesperrten Layer ausgewählt.

TIP: Die Statusleiste zeigt eine Zusammenfassung der Anzahl der ausgewählten Elemente an.


Befehl Keine

Verwenden Sie diesen Befehl, um die Auswahl rückgängig zu machen.

Wählen Sie hierzu Wählen / Keine.

TIP: Die Statusleiste zeigt eine Meldung an, daß keine Elemente ausgewählt sind.


Befehl Punkte

Verwenden Sie diesen Befehl, um das Dialogfeld Punkte wählen zu öffnen.

Wählen Sie hierzu  Wählen / Punkte.


Dialogfeld Punkte wählen

Überblick	Wie kann ich ...

Verwenden Sie dieses Dialogfeld, um Punkte mit den spezifizierten Kriterien auszuwählen. Sie können Jokerzeichen (Wildcards) und Bereiche verwenden. Sie können auch Kriterien in mehr als einem Register eingeben. Trimble Geomatics Office wählt nur Punkte aus, die alle Kriterien erfüllen.

Wählen Sie hierzu Wählen / Punkte.

Wenn Sie dieses Dialogfeld öffnen, während Sie sich in der Vermessungsansicht befinden, betrachtet Trimble Geomatics Office nur die Punkte, die gerade sichtbar sind. Dies bedeutet, daß, wenn Sie das Dialogfeld Ansicht Filter verwendet haben, um Beobachtungen zu filtern, diese nicht ausgewählt werden. Wenn Sie die Vermessungsansicht verwenden, werden Layer-Informationen (die in der Planansicht verfügbar sind) in den Auswahlkriterien ignoriert.

Wenn Sie dieses Dialogfeld öffnen, während Sie sich in der Planansicht befinden, betrachtet Trimble Geomatics Office nur die Punkte, die gerade sichtbar und nicht gesperrt sind. Wenn Sie die Planansicht verwenden, werden alle Filter ignoriert, die in der Vermessungsansicht angewendet wurden.

Die Register sind:

  Allgemein

  GPS

  Besetzung

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl rückgängig machen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, deaktivieren Sie dieses Kontrollkästchen.


Dialogfeld Punkte wählen - Register Allgemein
Dialogfeld Punkte wählen − Register Allgemein

Verwenden Sie dieses Register, um die Kriterien für die allgemeinen Punktfelder einzugeben.

Mit Name und Mit Kartiercode

Verwenden Sie diese Felder, um nach Namen (und Kartiercode) auszuwählen. Namen können durch Kommas getrennt eingegeben werden. Beispiel: "100,250,1020" wählt diese Namen einzeln aus, wenn sie im Projekt existieren. Mit Auslassungspunkten (...) oder einem Bindestrich (-) werden alle Punkte ausgewählt, deren Namen sich innerhalb des Bereichs befinden.

Bei einem Bereich, der alphanumerische Namen enthält, kann es sein, daß unerwartete Elemente ausgewählt werden, da eine vollständige alphabetische Sortierung verwendet wird.

HINWEIS: Wenn die Start- und Endnamen des Bereichs numerisch sind, wird ein numerischer Bereich ausgewählt.

Sie können Jokerzeichen (Wildcards) in diesen Feldern verwenden.

HINWEIS: Wenn der Name einen Bindestrich enthält, schließen Sie den Bindestrich mit einfachen Anführungszeichen ein. Beispiel: Der Punktname "a-2"  wird als "a-2" eingegeben. Ansonsten sortiert Trimble Geomatics Office den Bereich von a bis 2.

Verwenden Sie doppelte Anführungszeichen, um den Abgleich von Namen zu verhindern, die Jokerzeichen (Wildcards) enthalten. Beispiel: "URS#1"..."URS#8" verhindert, daß # als Jokerzeichen verwendet wird. Statt dessen wird genau der Punktbereich mit den Namen zwischen URS#1 und URS#8 ausgewählt.

Namen sind unabhängig von Groß- und Kleinschreibung.

Mit Punktqualität(en)

Verwenden Sie die Liste, um die Qualitätskriterien für Punktpositionskomponenten zu wählen. Sie können mehrere Punktqualitäten wählen.

Aus Quelle(n)

Verwenden Sie die Liste, um die Quelle(n) der Punkte zu wählen. Sie können mehrere Quellen wählen. Es werden Punkte mit Vermessungsdaten aus mindestens einer gewählten Quelle ausgewählt.

Mit Kartiercode

Geben Sie den/die Kartiercode(s) ein, die zur Punktauswahl verwendet werden sollen.

Aus Layer(n)

Diese Option ist nicht verfügbar, wenn Sie dieses Dialogfeld in der Vermessungsansicht aufrufen.

Verwenden Sie die Liste, um Layer-Kriterien zu wählen. Sie können mehrere Layer wählen. Alle Punkte in den gewählten Layern werden ausgewählt.

Mit Punktstil(en)

Verwenden Sie die Liste, um Punkt-CAD-Stil-Kriterien zu wählen. Sie können mehrere Punktstile wählen. Alle Punkte mit dem(im Eigenschaftsfenster - Register CAD ) eingestellten Punktstil werden ausgewählt.

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl rückgängig machen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, deaktivieren Sie dieses Kontrollkästchen.


Dialogfeld Punkte wählen - Register GPS
Dialogfeld Punkte wählen − Register GPS

Verwenden Sie dieses Register, um Auswahlkriterien unter Verwendung der GPS-Daten einzugeben. Diese Kriterien gelten sowohl für nachverarbeitete als auch für RTK-GPS-Basislinien.

Wenn ein Punkt mindestens eine Basislinie hat, die die Kriterien erfüllt, wird der Punkt ausgewählt.

Horizontale Genauigkeit, Vertikale Genauigkeit

Klicken Sie auf die Schaltfläche Kleiner-Gleich oder Größer-Gleich, um das Zeichen für Ihre Kriterien zu wählen.

Geben Sie Werte für die Genauigkeit mit der Tastatur ein.

Wenn Sie eines der Felder als Fragezeichen (?) belassen, wird dieses Feld nicht in den Auswahlkriterien verwendet.

Lösungstyp(en)

Verwenden Sie die Liste, um Lösungstyp-Kriterien anzugeben. Sie können mehrere Lösungstypen wählen. Jeder Punkt (mit den gewählten Lösungstypen), zu dem GPS-Beobachtungen durchgeführt wurden, wird ausgewählt.

Feldmethode(n)

Verwenden Sie die Liste, um die Feldmethoden-Kriterien zu wählen. Sie können mehrere Feldmethoden wählen.

HINWEIS: Nur Punkte, die sowohl Lösungstyp als auch Feldmethode erfüllen, werden ausgewählt.

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl rückgängig machen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, deaktivieren Sie dieses Kontrollkästchen.


Dialogfeld Punkte wählen - Register Besetzung
Dialogfeld Punkte wählen − Register Besetzung

Verwenden Sie dieses Register, um Auswahlkriterien für fortgeschrittene Felder und Einstellungen einzugeben.

Verwenden Sie dieses Register, um Auswahlkriterien unter Verwendung der Besetzungsdetails einzugeben. Alle Punkte mit mindestens einer Besetzung, die die Kriterien erfüllt, werden ausgewählt.

Alle Basisstations- und Instrumentenstandpunkte

Aktivieren Sie dieses Kontrollkästchen, um alle GPS-Basisstationspunkte und Instrumentenstandpunkte zu wählen.

Mit Antennen- oder Zielhöhen zwischen

Verwenden Sie diese Felder, um einen Antennen- oder Zielhöhenbereich für Ihre Kriterien einzugeben. Der Wert, der in das erste Feld eingegeben wird, muß kleiner sein als der Wert, den Sie in das zweite Feld eingeben. Die eingegebenen Werte sind im Bereich enthalten.

Besetzung zwischen Zeiten

Aktivieren Sie dieses Kontrollkästchen, um Kriterien für einen Datum- und Zeitbereich einzugeben. Besetzungen von Punkten, deren Start- und Stopp-Zeiten sich innerhalb dieses Bereichs befindet, werden gewählt. Die Software speichert die von Ihnen eingegebenen Werte, damit Sie sie erneut verwenden können, wenn Sie diese Option das nächste Mal aufrufen.

Beobachtet von Punkt

Geben Sie einen Punkt ein, von dem die Beobachtung ausging. Der Punkt kann entweder eine GPS-Basisstation oder ein Instrumentenstandpunkt sein.

Verwenden Sie die graphische Auswahl, um einen Punkt im Graphikfenster auszuwählen.

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl rückgängig machen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, deaktivieren Sie dieses Kontrollkästchen.


Elemente auswählen - Verwenden von Jokerzeichen (Wildcards)
Elemente auswählen − Jokerzeichen (Wildcards) verwenden

 Überblick und weitere Informationen

Wenn Sie Punkte mit dem Dialogfeld Wählen / Punkte oder Beobachtungen mit dem Dialogfeld Wählen / Beobachtungen, auswählen, können Sie in einigen Feldern Jokerzeichen (Wildcards) verwenden, um einen Bereich von Werten auszuwählen.

Sie können die folgenden Jokerzeichen (Wildcards) verwenden:

Sie können mehrere Jokerzeichen verwenden. Beispiel: 1?0*0 findet 1500, 1A0250, 15020.

Die folgende Tabelle zeigt, wie Sie Abgleicharten verwenden können, um nach den Mustern zu suchen.

Der Punktname "10" liegt zwischen "1" und "a". Er liegt nicht im Bereich zwischen "1" und "9", da beide Namen numerisch sind.


    Befehl Beobachtungen

Verwenden Sie diesen Befehl, um das Dialogfeld Beobachtungen wählen zu öffnen.

Wählen Sie hierzu  Wählen / Beobachtungen.


    Dialogfeld Beobachtungen wählen

Weitere Informationen

Überblick	Wie kann ich ...

Wählen Sie hierzu Wählen / Beobachtungen.

Verwenden Sie dieses Dialogfeld, um Beobachtungen mit den spezifizierten Kriterien auszuwählen. Sie können Jokerzeichen (Wildcards) und Bereiche verwenden. Sie können auch Kriterien in mehr als ein Register eingeben. Trimble Geomatics Office wählt nur Beobachtungen aus, die alle Kriterien erfüllen.

Die Register sind:

  Allgemein

  GPS

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl rückgängig machen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, aktivieren Sie dieses Kontrollkästchen.


Dialogfeld Beobachtungen wählen - Register Allgemein
    Dialogfeld Beobachtungen wählen − Register Allgemein

Verwenden Sie dieses Register, um allgemeine Kriterien zur Auswahl von Beobachtungen einzugeben.

Von Punkt, Zu Punkt

Namen können durch Kommas getrennt eingegeben werden. Mit einem Auslassungszeichen (...) oder einem Bindestrich (-) wird jede Basislinie ausgewählt, deren Name sich innerhalb des angegebenen Bereichs befindet. Bei einem Bereich mit alphanumerischen Namen kann es vorkommen, daß unerwartete Elemente ausgewählt werden, da eine volle alphabetische Suche verwendet wird.

HINWEIS: Wenn Start- und Endnamen des Bereichs numerisch sind, wird ein numerischer Bereich ausgewählt.

Sie können Jokerzeichen (Wildcards) verwenden.

Mit Schrägstrecke zwischen

Verwenden Sie diese Felder, um einen Bereich für die Schrägstrecke einzugeben. Der Wert, den Sie in das erste Feld eingeben, muß kleiner sein als der Wert, den Sie in das zweite Feld eingeben. Die eingegebenen Werte sind im Bereich enthalten.

Wenn eine reduzierte Beobachtung mit einer horizontalen Strecke innerhalb des angegebenen Bereichs existiert, werden die Beobachtungen ebenfalls ausgewählt.

Typen

Wählen Sie aus dieser Liste den Beobachtungstyp. Sie können z. B. RTK-, Laser- oder Azimut-Beobachtungen wählen.

Aus Quelle(n)

Verwenden Sie die Liste, um Beobachtungsquelle(n) zu wählen. Sie können mehrere Quellen wählen. Alle Beobachtungen mit mindestens einer Beobachtungsquelle werden ausgewählt.

Mit Status

Verwenden Sie die Liste, um den Beobachtungsstatus zu wählen, der in Ihren Kriterien verwendet werden soll(en).

Mit Beobachtungs-ID

Geben Sie die Beobachtungs-ID oder eine Reihe von Beobachtungs-IDs ein, um die Beobachtung(en) auszuwählen. Geben Sie z. B. BL8 ein, um die GPS-Basislinie 8 zu wählen, und BL8-BL12, um alle Beobachtungen in diesem Bereich zu wählen.

Nur Polarpunkte

Wenn dieses Kontrollkästchen gewählt ist, werden nur Polarpunkte ausgewählt.

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl löschen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, deaktivieren Sie dieses Kontrollkästchen.


Beobachtungen wählen - Register GPS
    Beobachtungen wählen − Register GPS

Verwenden Sie dieses Register, um Kriterien für die Auswahl von GPS-Basislinien einzugeben.

Verhältnis

Verwenden Sie das Kleiner- oder Größer-Zeichen. Geben Sie den Verhältniswert ein, den Sie in Ihren Kriterien verwenden möchten.

Ref.-varianz

Verwenden Sie das Kleiner- oder Größer-Zeichen. Geben Sie die Referenzvarianz ein, die Sie in Ihren Kriterien verwenden möchten.

RMS

Verwenden Sie das Kleiner- oder Größer-Zeichen. Geben Sie den RMS-Wert ein, den Sie in Ihren Kriterien verwenden möchten.

Horz Gen

Klicken Sie auf das Kleiner-Gleich- oder Größer-Gleich-Zeichen, um das Zeichen für Ihre Kriterien zu wählen. Geben Sie den horizontalen Genauigkeitswert ein, den Sie in Ihren Kriterien verwenden möchten.

Vert Gen

Klicken Sie auf das Kleiner-Gleich- oder Größer-Gleich-Zeichen, um das Zeichen für Ihre Kriterien zu wählen. Geben Sie den vertikalen Genauigkeitswert ein, den Sie in Ihren Kriterien verwenden möchten.

HINWEIS: Die Abfragen Horz Gen. und Vert Gen. basieren auf genauen Werten. Die in den Feldern im Eigenschaftsfenster angezeigten Werte sind gerundete Werte.

Lösungstype(n)

Verwenden Sie die Liste, um den (die) Lösungstyp(en) zu wählen, der (die) in Ihren Kriterien verwendet werden soll(en). Sie können mehrere Lösungstypen wählen.

Feldmethode(n)

Verwenden Sie die Liste, um die GPS-Feldmethode(n) zu wählen, die in Ihren Kriterien verwendet werden soll(en). Sie können mehrere Feldmethoden wählen.

HINWEIS: Nur Punkte, die sowohl Lösungstyp als auch Feldmethode erfüllen, werden ausgewählt.

Beobachtet zwischen

Verwenden Sie diese Felder, um einen Datums- und Zeitbereich für Ihre Kriterien einzugeben. Beobachtungen, deren Start- und Endzeiten innerhalb der festgelegten Kriterien liegen, werden ausgewählt. Die Software speichert die Werte, die Sie eingeben, damit Sie sie erneut verwenden können, wenn Sie diese Option das nächste Mal aufrufen.

Beobachtet länger als (Sek.)

Verwenden Sie dieses Feld, um GPS-Basislinien auszuwählen, die über einen längeren Zeitraum als die von Ihnen angegebene Zeit beobachtet wurden. Das Feld hat das Format hh:mm:ss.

HINWEIS: Sie können die graphische Auswahl verwenden, um die Zeit anzugeben.

Zu aktueller Auswahl hinzufügen

Wenn ein oder mehrere Elemente ausgewählt sind, wenn Sie dieses Dialogfeld aufrufen, wird dieses Kontrollkästchen verfügbar. Wenn Sie die aktuelle Auswahl rückgängig machen möchten, bevor Sie die in diesem Dialogfeld getroffene Auswahl anwenden, deaktivieren Sie dieses Kontrollkästchen.


    Befehl Nach Layer

Verwenden Sie diesen Befehl, um alle Elemente in den gewählten Layern auszuwählen.

So greifen Sie darauf zu:

  Wählen Sie Wählen / Nach Layer.

Das Dialogfeld Nach Layer auswählen erscheint.


    Dialogfeld Nach Layer auswählen

Verwenden Sie dieses Dialogfeld, um alle Elemente in den gewählten Layern auszuwählen.

So greifen Sie darauf zu:

  Wählen Sie Wählen / Nach Layer.

Layer

Die Liste Layer zeigt die Namen aller Layer im Projekt an.

Wählen Sie das Kontrollkästchen neben dem Layer-Namen, um  Elemente auszuwählen, die in einem Layer angezeigt werden.

Wenn die Eigenschaft Gesperrt eines Layers eingeschaltet  ist oder die Eigenschaft Sichtbar ausgeschaltet ist, ist das Kontrollkästchen für den Layer grau unterlegt. Verwenden Sie das Symbol Layer-Auswahl oder das Dialogfeld Layer, um die Eigenschaften Gesperrt und Sichtbar zu ändern und die Auswahl eines Layers zu ermöglichen. Das Kontrollkästchen für den Layer wird dann verfügbar.

Alle

Klicken Sie auf Alle, um alle Layer auszuwählen, die in der Liste Layer angezeigt werden.

Keine

Klicken Sie auf Keine, um die Kontrollkästchen für alle Layer in der Liste Layer zu deaktivieren.


    Befehl Nach Stil

Verwenden Sie diesen Befehl, um Elemente auszuwählen, die einen bestimmten Stil verwenden.

Wählen Sie hierzu Wählen / Nach Stil.

Das Dialogfeld Nach Stil auswählen erscheint.


    Dialogfeld Nach Stil auswählen

Verwenden Sie dieses Dialogfeld, um alle CAD-Elemente (Punkte, Linien, Bögen, Kurven, Anmerkungen, Text) mit den angegebenen Stilen in der Planansicht auszuwählen.

Wählen Sie hierzu Wählen / Nach Stil.

Stile

Wählen Sie das Register eines besonderen Stiltyps. Die Stile sind dieselben wie die Stile, die im Dialogfeld CAD-Stile verfügbar sind. Wählen Sie einen Stil aus der erscheinenden Liste. Sie können nur ein Register verwenden, um Elemente auszuwählen. Wenn Sie einen oder mehrere Stile aus einem Register wählen und dann ein anderes Register wählen, geht die Auswahl im vorherigen Register verloren.

Verwenden Sie dieses Dialogfeld, um mehrere Elementtypen auszuwählen (Beispiel: Punkte und Linien). Speichern Sie die Auswahlmenge, und wählen Sie dann den/(die) anderen Elementtyp(en). Speichern Sie die neue Auswahlmenge. Sie können mit Wählen / Auswahlmengen / Laden beide Auswahlmengen zur gleichen Zeit laden.

Verwenden Sie die Option <Nach Layer>, um Elemente auszuwählen, für die das entsprechende Feld auf <Nach Layer> eingestellt ist.

Alle

Klicken Sie auf Alle, um alle Stile auszuwählen, die in der Liste Stile angezeigt werden.

Keine

Klicken Sie auf Keine, um alle Kontrollkästchen für die in der Liste Stile angezeigten Stile zu deaktivieren.


    Befehl Nach Typ

Verwenden Sie dieses Dialogfeld, um Elemente mit bestimmtem(n) Typ(en) auszuwählen.

Wählen Sie hierzu Wählen / Nach Typ.

Das Dialogfeld Nach Typ auswählen erscheint.


    Dialogfeld Nach Typ auswählen

Verwenden Sie dieses Dialogfeld, um Elemente mit spezifiziertem(n) Typ(en) auszuwählen.

Wählen Sie hierzu Wählen / Nach Typ.

Typen

Die Liste Typen zeigt die Namen aller verschiedenen Elementtypen (Punkte, Linien, Kurven, Bögen, Anmerkungen, Text) an.

Aktivieren Sie das Kontrollkästchen eines bestimmten Typs, um Elemente diesen Typs auszuwählen.

Alle

Klicken Sie auf Alle, um alle Typen auszuwählen, die in der Liste Typen angezeigt werden.

Keine

Klicken Sie auf Keine, um alle Kontrollkästchen für die in der Liste Typen angezeigten Typen zu deaktivieren.


Befehl Nach Abfrage

Verwenden Sie diesen Befehl, um Elemente auszuwählen, die in Abfragen angegebene Bedingungen erfüllen.

Wählen Sie hierzu Wählen / Nach Abfrage.

Das Dialogfeld Nach Abfrage auswählen erscheint.


Dialogfeld Nach Abfrage auswählen

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um eine Abfrage zur Auswahl von Elementen zu wählen.

Wählen Sie hierzu Wählen / Nach Abfrage.

Abfragen

Die Liste der verfügbaren Abfragen enthält alle benutzerdefinierten Abfragen, die Sie im Projekt definiert haben, sowie die folgenden Abfragen:

Name der Abfrage	Was gewählt wird …
Alle Ereignisse	Beobachtungen mit Ereignis-Datensätzen
Autonome GPS-Punkte	Punkte mit autonomen Positionen, z. B. Punkte in einer .dat-Datei, die nicht verarbeitet wurde.
Basislinien mit Empfänger	Basislinien, die mit demselben Empfänger beobachtet wurden. Geben Sie den Wert in das Parametereingabe-Dialogfeld ein.
Konventionell beobachtete Punkte	Punkte, die mit konventionellen Instrumenten beobachtet wurden.
Höhenbereich	Punkte, deren orthometrische Höhen im angegebenen Höhenbereich liegen. Geben Sie Werte in das Parametereingabe-Dialogfeld ein.
Eingegebene WGS-84 Punkte	Eingegebene WGS-84 Punkte.
Laser- Enfternungsmesser- Punkte	Punkte, die mit einem Laser-Entfernungsmesser beobachtet wurden.
Notizen	Alle Notiz-Datensätze im Projekt. Notizen können im Feld unter Verwendung von Trimble Survey Controller hinzugefügt werden. Verwenden Sie diese Auswahloption, um Notizen für die Erstellung benutzerdefinierter Berichte zu wählen.
NULL-Koordinaten	Punkte mit Null-Koordinaten. Dies kann vorkommen, wenn Sie eine Beobachtung zu einem Rückblick-Punkt ohne Koordinaten durchgeführt haben.
NULL-Höhen	Punkte mit orthometrischen Null-Höhen.
Punkte nach Beschreibung	Punkte, deren Beschreibungsfeld Ihrer Angabe entspricht. Geben Sie Werte in das Parametereingabe-Dialogfeld ein Sie können Jokerzeichen (Wildcards) verwenden.
Mehrfach beobachtete Punkte	Punkte, die mehrfach beobachtet wurden. Bei diese Abfrage werden alle Beobachtungstypen verwenden. Bei terrestrischen Beobachtungen werden Zielpunkte verwenden. Bei RTK-Besetzungen werden GPS-Besetzungen für den Punkt verwendet. Für statische und FastStatic-Beobachtungen wird die Beobachtung verwendet, deren Punkt der "Zu"-Punkt der Beobachtung ist. Bei der Abfrage wird alles vorstehend genannte aufaddiert, und es werden die Punkte gewählt, deren Summe über 1 liegt.
Punkte mit unterschiedlichen Namen innerhalb Strecke	Punkte mit unterschiedlichen Namen, die sich innerhalb der festgelegten Strecke befinden. Geben Sie Werte in das Parametereingabe-Dialogfeld ein.
Punkte ohne Namen	Punkte ohne Namen.
RTK-Vektoren mit Kovarianzen (QC2)	RTK-Vektoren mit QC2-Datensätzen. Diese Punkte können in einer Netzausgleichung verwendet werden (wenn das Netzausgleichungsmodul installiert ist).
Unverarbeitete Basislinien	Basislinien, die verarbeitet werden können, aber noch nicht verarbeitet wurden.

Die Abfragen wählen Elemente gemäß der Abfragedefinition aus, und eine Beschreibung der Abfrage wird in der Statusleiste angezeigt.

Beispiel: Sie können Punkte in einem bestimmten Höhenbereich auswählen.

Wenn Parameter für Abfragen erforderlich sind, befindet sich hinter dem Name ein Auslassungszeichen (...). Wenn Sie eine solche Abfrage wählen, werden Sie aufgefordert, die Parameterwerte anzugeben.

Auswahl

Sie können in der Gruppe Auswahl drei Auswahlvorgänge durchführen:

  Neu – erstellt eine neue Auswahlmenge

  Zu aktueller Abfrage hinzufügen − fügt die Auswahlmenge, die Sie erstellen, zur aktuellen Auswahlmenge hinzu

  Detailliertere Abfrage − sucht Punkte, die in der von Ihnen erstellten Auswahlmenge enthalten sind.

Stellen Sie sich z. B. vor, Sie möchten ein Projekt nach nicht verarbeiteten Basislinien durchsuchen, die mit einem GPS-Empfänger mit der Seriennummer 1234 beobachtet wurden. Tun Sie folgendes:

1.	Verwenden Sie die Abfrage, um alle nicht verarbeiteten Basislinien auszuwählen.

2.	Verwenden Sie die Abfrage erneut, um die Option Basislinien mit Empfänger auszuwählen.

3.	Wählen Sie in der Gruppe Auswahl die Option Detailliertere Abfrage.

4.	Geben Sie die Seriennummer des Empfängers (1234) in das Dialogfeld Nach Abfrage auswählen − Parameter ein.

Alle nicht verarbeiteten Basislinien, die mit Empfänger 1234 beobachtet wurden, werden ausgewählt.


Befehl Nach Punktmerkmal auswählen
Befehl Nach Punktmerkmal

Verwenden Sie diesen Befehl, um Punkte auszuwählen, die Kartiercodes mit Attributen haben, die den von Ihnen angegebenen Namen entsprechen.

Wählen Sie hierzu Wählen / Nach Punktmerkmal.

Das Dialogfeld Nach Punktmerkmal auswählen erscheint.


Dialogfeld Nach Punktmerkmal auswählen

Verwenden Sie dieses Dialogfeld, um Punkte auszuwählen, die aufgezeichnete Merkmale und Attribute haben. Verwenden Sie das Eigenschaftsfenster - Register Attribute, um die aufgezeichneten Merkmale und Attribute anzusehen.

Merkmale

Die Merkmalsliste zeigt alle Merkmale mit Attributdefinitionen der Merkmals- und Attributbibliotheksdatei (*.fcl) oder Attribut-Verzeichnisdatei (*.ddf) an, die Sie verwendet haben, um das Projekt für Attribute einzurichten.

Wählen Sie die Kontrollkästchen für die Merkmale. Punkte mit mindestens einem der spezifizierten Merkmale werden ausgewählt.

Alle

Klicken Sie auf Alle, um alle Kontrollkästchen zu aktivieren.

Keine

Klicken Sie auf Keine, um alle Kontrollkästchen zu deaktivieren.


Auswahlmengen - Überblick
Auswahlmengen − Überblick

Weitere Informationen

 Wie kann ich ...

Überblick

Eine Auswahlmenge umfaßt alles, was Sie gerade in Trimble Geomatics Office ausgewählt haben. Sie können Ihre aktuelle Auswahlmenge jederzeit speichern und später wieder laden. Sie können z. B. eine Auswahlmenge aller Festpunkte innerhalb eines Projekts aufnehmen und regelmäßig durch Laden der Auswahlmenge darüber berichten. In diesen gespeicherten Auswahlmengen wird die Reihenfolge der Elemente beibehalten. Wenn Sie Elemente löschen, die Teil der Auswahlmenge sind, arbeitet die Auswahlmenge weiterhin mit den verbleibenden Elementen.

HINWEIS: Sie können Auswahlmengen unter Verwendung der Option Nur Daten in Auswahlmenge anzeigen im Dialogfeld Ansicht Filter anzeigen.

Wenn Sie eine Datei importieren, erzeugt Trimble Geomatics Office automatisch eine benannte Auswahlmenge. Eine Auswahlmenge zeichnet die Reihenfolge auf, in der Daten aufgezeichnet wurden. Dies ist z. B. wichtig für Aufgaben wie die Verarbeitung von Kartiercodes.

Bei Survey Controller-Dateien (*.dc) wird der neuen Auswahlmenge in Trimble Geomatics Office der Name des importierten Projektkennzeichens zugewiesen. Bei anderen Dateien, z. B. ASCII-Dateien, wird der neuen Auswahlmenge in Trimble Geomatics Office der Name der Datei zugewiesen.

HINWEIS: Wenn Sie RTK-Daten importieren, bei denen die Initialisierung innerhalb der ersten 15 Minuten verloren ging, wird beim Importieren eine Auswahlmenge mit hohem RMS erstellt.


Befehl Auswahlmengen - Speichern
Befehl Auswahlmengen − Speichern

Verwenden Sie diesen Befehl, um die aktuelle Auswahlmenge zu speichern.

So greifen Sie darauf zu:

  Wählen Sie Wählen / Auswahlmengen / Speichern.

Das Dialogfeld Speichern erscheint.

Dieser Befehl ist nicht verfügbar, wenn keine Auswahl getroffen wurde.


Dialogfeld Auswahlmengen - Speichern
Dialogfeld Auswahlmengen − Speichern

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um die aktuelle Auswahlmenge zu speichern.

Wählen Sie hierzu Wählen / Auswahlmengen / Speichern.

Name

Geben Sie einen eindeutigen Namen für die Auswahlmenge ein.

OK

Klicken Sie auf OK, um die Auswahlmenge zu erzeugen.

Die Auswahlmenge erscheint im Dialogfeld Laden, wenn Sie dieses das nächste Mal öffnen. Die neue Auswahlmenge wird zur Liste der kürzlich verwenden Auswahlmengen hinzugefügt. Um das Dialogfeld Laden zu öffnen und die kürzlich verwendeten Auswahlmengen anzusehen, wählen Sie Wählen / Auswahlmengen.


Befehl Auswahlmengen - Laden
Befehl Auswahlmengen − Laden

Verwenden Sie diesen Befehl, um eine Auswahlmenge zu laden. Dieser Befehl ist nicht verfügbar, wenn keine Auswahlmengen zur Verfügung stehen.

So greifen Sie darauf zu:

  Wählen Sie Wählen / Auswahlmengen / Laden.

Das Dialogfeld Laden erscheint.


Dialogfeld Auswahlmengen - Laden
Dialogfeld Auswahlmengen − Laden

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um eine oder mehrere Auswahlmengen auf einmal zu laden. Beispiel: Wenn Sie zwei Auswahlmengen haben, verwenden Sie dieses Dialogfeld, um alle Elemente in beiden Auswahlmengen auszuwählen.

Wählen Sie hierzu Wählen / Auswahlmengen / Laden.

Auswahlmengen

Diese Liste enthält alle gespeicherten Auswahlmengen des Projekts.

Alles

Klicken Sie auf Alle, um alle Auswahlmengen zu wählen.

Keine

Klicken Sie auf Keine, um die Kontrollkästchen für alle Auswahlmengen zu deaktivieren.


Befehl Auswahlmengen - Bearbeiten
Befehl Auswahlmengen − Bearbeiten

Verwenden Sie diesen Befehl, um Details gespeicherter Auswahlmengen zu bearbeiten. Dieser Befehl ist nicht verfügbar, wenn es keine Auswahlmengen zum Bearbeiten gibt.

Wählen Sie hierzu Wählen / Auswahlmengen / Bearbeiten.

Das Dialogfeld Bearbeiten erscheint.


Dialogfeld Auswahlmengen - Bearbeiten
Dialogfeld Auswahlmengen − Bearbeiten

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um gespeicherte Auswahlmengen umzubenennen oder zu löschen.

Auswahlmengen

Heben Sie die Auswahlmenge hervor, die Sie bearbeiten oder löschen möchten.

Umbenennen

Klicken Sie auf Umbenennen, um die hervorgehobene Auswahlmenge umzubenennen.

Löschen

Klicken Sie auf Löschen, um die hervorgehobene Auswahlmenge zu löschen.


Dialogfeld Auswahlmengen - Umbenennen
Dialogfeld Auswahlmengen − Umbenennen

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um die hervorgehobene Auswahlmenge umzubenennen.

So greifen Sie darauf zu:

1.	Wählen Sie  Wählen / Auswahlmengen / Bearbeiten. Das Dialogfeld Bearbeiten erscheint.

2.	Klicken Sie auf Umbenennen. Das Dialogfeld Umbenennen erscheint.

Name

Geben Sie einen eindeutigen Namen für die Auswahlmenge ein.

OK

Klicken Sie auf OK, um die Änderungen anzuwenden.

Die Auswahlmenge erscheint im Dialogfeld Bearbeiten. Die neue Auswahlmenge erscheint in der Liste der kürzlich verwendeten Auswahlmengen.


Elemente auswählen - Überblick
Elemente auswählen − Überblick

Manchmal möchten Sie einen Vorgang nur auf eine Untermenge des Projekts anwenden. (Beispiel: Verarbeiten von Kartiercodes). Sie können Elemente (Punkte, Linien, Bögen, Kurven, Text, Anmerkungen, Beobachtungen) im Projekt auf zwei Arten auswählen:

  mit der Maus.

  mit dem Menü Wählen.

Die Maus zum Auswählen von Elementen verwenden

Klicken Sie mit der Maus auf ein Element, um es auszuwählen. (Halten Sie gleichzeitig die Taste Umschalt gedrückt, um mehrere Elemente auszuwählen).

Sie können dann die gewünschten Aufgaben mit den ausgewählten Elementen durchführen.

Drücken Sie Strg, um eine Auswahl umzukehren (zu invertieren). Alle aktuell ausgewählten Elemente werden entwählt und umgekehrt.

HINWEIS: Sie können die Maus verwenden, um Elemente im Eigenschaftsfenster anzusehen, ohne sie erneut auszuwählen. Klicken Sie mit der Maustaste auf einen Punkt, und halten Sie die Taste einige Sekunden lang gedrückt. Ziehen Sie dann den Mauszeiger über die Elemente, die Sie ansehen möchten.

Das Menü Wählen zum Auswählen von Elementen verwenden

Das Menü Wählen enthält viele verschiedene Methoden zur Auswahl von Punkten. Die Optionen des Menüs Wählen hängen davon ab, ob Sie sich in der Vermessungsansicht oder in der Planansicht befinden.


Befehl Doppelte Punkte - Nach Koordinaten
Befehl Doppelte Punkte − Nach Koordinaten

Verwenden Sie diesen Befehl, um Punkte auszuwählen, die identische Koordinaten haben.

Wählen Sie hierzu Wählen / Doppelte Punkte / Nach Koordinaten.


Befehl Doppelte Punkte - Nach Name
Befehl Doppelte Punkte − Nach Name

Verwenden Sie diesen Befehl, um Punkte auszuwählen, die doppelte Namen haben.

So greifen Sie darauf zu:

  Wählen Sie Wählen / Doppelte Punkte / Nach Name.

TIP: Verwenden Sie diesen Befehl, bevor Sie doppelte Punkte kombinieren.


Befehl Doppelte Punkte - Nach Name und Strecke
Befehl Doppelte Punkte − Nach Name und Strecke

Verwenden Sie diesen Befehl, um Punkte auszuwählen, die doppelte Namen haben und sich innerhalb einer spezifizierten Strecke befinden. Geben Sie Werte in das Parametereingabe-Dialogfeld ein.

So greifen Sie darauf zu:

  Wählen Sie Wählen / Doppelte Punkte / Nach Name und Strecke.


Dialogfeld Abgesteckte Punkte wählen

Verwenden Sie dieses Dialogfeld, um abgesteckte Punkte durch eine Reihe von Abfragen zu finden. Die Auswahlsymbole können mit der Option Zusätzliche Berichte und benutzerdefinierten Exportoptionen verwendet werden.

Wählen Sie hierzu Wählen / Abgesteckte Punkte.

Abfragen

Die Liste der verfügbaren Abfragen enthält alle benutzerdefinierten Abfragen, die Sie im Projekt definiert haben, sowie:

Name der Abfrage	Was gewählt wird …	Geben Sie folgende Informationen in das Parametereingabe-Dialogfeld ein …
Alle abgesteckten Punkte	Alle Punkte, die im Feld abgesteckt wurden.
Bogenpunkte	Punkte, die sich auf einen Bogen beziehen, z. B. Punkte, die auf, von oder zu einem Bogen abgesteckt wurden.	den Bogennamen
DGM-Punkte	Punkte, die sich auf ein DGM beziehen,      z. B. Punkte, die auf, von oder zu einem DGM abgesteckt wurden.	den Namen des DGMs
Linienpunkte	Punkte, die sich auf eine Linie beziehen,    z. B. Punkte, die auf, von oder zu einer Linie abgesteckt wurden.	den Namen der Linie
Sollpunkte	Punkte, die sich auf einen Sollpunkt beziehen, z. B. Punkte, die von, zu oder auf einem Sollpunkt abgesteckt wurden.	den Namen des Sollpunkts
Trassenpunkte	Punkte, die sich auf einen Trassenpunkt beziehen, z. B. Punkte, die von, zu oder auf einer Trasse abgesteckt wurden.	den Trassennamen
Geländeschnitt -punkte für eine Trasse	Geländeschnittpunkte für eine Trasse.	den Trassennamen
Punkte auf einer Trasse mit Merkmalen	Punkte auf einer Trasse mit einem Merkmal.	den Trassennamen und das Merkmal
Alle Punkte mit Absteckungs- fehlern größer als	Punkte, deren Absteckungsfehler größer sind, als die im Parametereingabe-Dialogfeld festgelegten horizontalen und vertikalen Fehler.

Falls Parameter für eine Abfrage eingegeben werden müssen, steht hinter dem Namen ein Auslassungszeichen. Wenn Sie eine dieser Abfragen wählen, werden Sie aufgefordert, die Parameterwerte einzugeben.

Auswahl

Sie können in der Gruppe Auswahl drei Auswahlvorgänge ausführen:

  Neu – erstellt eine neue Auswahlmenge

  Zu aktueller Abfrage hinzufügen – fügt die Auswahlmenge, die Sie erstellen, zur aktuellen Auswahlmenge hinzu

  Detailliertere Abfrage – sucht mit Hilfe der aktuellen Auswahl Punkte, die in der angegebenen Auswahlmenge enthalten sind

Stellen Sie sich z. B. vor, daß Sie ein Projekt nach nicht verarbeiteten Basislinien durchsuchen möchten, die mit einem GPS-Empfänger mit der Seriennummer 1234 beobachtet wurden. Tun Sie folgendes:

1.	Verwenden Sie die Abfrage, um alle nicht verarbeiteten Basislinien auszuwählen.

2.	Verwenden Sie die Abfrage erneut, um die Option Basislinien mit Empfänger… auszuwählen. Wählen Sie in der Gruppe Auswahl die Option Detailliertere Abfrage. Geben Sie die Seriennummer des Empfängers (1234) in das Dialogfeld Nach Abfrage auswählen – Parameter ein.

Alle nicht verarbeiteten Basislinien, die mit Empfänger 1234 beobachtet wurden, werden ausgewählt.


Kalibrierungspunkte auswählen

Verwenden Sie diese Option, um Kalibrierungspunkte auszuwählen, die im Dialogfeld GPS-Kalibrierung − Punktliste des Trimble Geomatics Office Projekts erscheinen.

Wählen Sie hierzu Wählen / Kalibrierungspunkte.

Alle Kalibrierungspunkte, die im Dialogfeld GPS-Kalibrierung – Punktliste enthalten sind, werden in dem Projekt ausgewählt.

HINWEIS: Wenn keine Punkte in der Kalibrierungspunktliste vorhanden sind, steht diese Option nicht zur Verfügung.


Technische Unterstützung

Wenn Sie ein Problem haben und die benötigten Informationen nicht in der Dokumentation des Produkts finden können, wenden Sie sich an Ihren Trimble-Händler. Sie können auch technische Unterstützung über die Trimble-Website im World Wide Web erhalten (http://www.trimble.com/support/support.htm).


Symbolleisten - Überblick
Symbolleisten − Überblick

Eine Symbolleiste besteht aus einem oder mehreren Symbolen. Symbolleisten sind im Graphikfenster von Trimble Geomatics Office durch vertikale Linien voneinander getrennt. Ein Symbol ist eine Verknüpfung zu häufig verwendeten Menübefehlen.

Positionieren Sie den Mauszeiger über dem Symbol, um eine Beschreibung des Symbols einzublenden, und sehen Sie:

  die QuickInfo

  die Statusleiste

Um die Reihenfolge zu ändern, in der die Symbolleisten im Trimble Geomatics Office-Fenster positioniert sind, ziehen Sie eine Symbolleiste mit Hilfe der vertikalen Linie, die die Symbolleiste von den anderen Elementen im Fenster trennt.

Die folgenden Symbolleisten stehen sowohl in der Vermessungsansicht als auch in der Planansicht zur Verfügung:

  Standard

  Ansicht

  Ansichtsparameter

.

Die folgenden Symbolleisten stehen nur in der Vermessungsansicht zur Verfügung:

  Filter

  Timeline (vorausgesetzt, das Basislinienverarbeitungsmodul ist installiert)

  Timeline-Plots (vorausgesetzt, das Basislinienverarbeitungsmodul ist installiert)

  Ellipsenparameter (vorausgesetzt, das Netzausgleichungsmodul ist installiert)

Die folgenden Symbolleisten stehen nur in der Planansicht zur Verfügung:

  Layer

  CAD


 CAD-Symbolleiste

Die CAD-Symbolleiste ermöglicht Ihnen einen schnellen Zugriff auf die allgemeinen Funktionen des Menüs Einfügen.

Dieses Symbol …	Öffnet folgendes Dialogfeld …	Verwenden Sie es, um folgende Elemente zur Datenbank hinzuzufügen …
	Punkte einfügen	Punktdatensätze
	Punkte nach Azimut und Strecke einfügen	Punktdatensätze
	Liniennetz einfügen	Liniendatensätze
	Liniennetz einfügen	Kurvendatensätze
	Liniennetz einfügen	Bogendatensätze
	Text einfügen	Textdatensätze


Standard-Symbolleiste

Die Standard-Symbolleiste ermöglicht einen schnellen Zugriff auf einige der Hauptoptionen, die im Menü Datei und im Menü Bearbeiten verfügbar sind.

Symbol	Wählen Sie es, um …
	ein neues Projekt zu öffnen
	ein bestehendes Projekt zu öffnen
	Daten aus einer Datei, einem Gerät oder einem GPS-Empfänger zu importieren
	Daten in eine Datei, ein Gerät oder einem GPS-Empfänger zu exportieren
	die Auswahl auszuschneiden und sie in die Zwischenablage zu übertragen
	die Auswahl zu kopieren und sie in die Zwischenablage zu übertragen
	den Inhalt aus der Zwischenablage einzufügen
	den letzten Vorgang rückgängig zu machen
	den zuletzt rückgängig gemachten Vorgang zu wiederholen
	das Eigenschaftsfenster zu öffnen und die Eigenschaften der aktuellen Auswahl anzusehen.


Symbol Layer bearbeiten

Wählen Sie das Symbol [image] , um das Dialogfeld Layer anzuzeigen. Verwenden Sie dieses Dialogfeld zur Verwaltung der Layer.


    Auswahl-Symbol Layer

Der dargestellte Layer ist der aktuelle Layer. Klicken Sie auf den Pfeil, um den aktuellen Layer zu ändern, und wählen Sie den Layer aus der Liste.

Das Glühbirnensymbol zeigt an, ob der Layer sichtbar ist oder nicht. Um die Sichtbarkeit eines beliebigen Layers zu ändern, klicken Sie auf das Glühbirnensymbol für den entsprechenden Layer.

Das Glühbirnensymbol ist abgedunkelt. Klicken Sie erneut auf das Glühbirnensymbol, um den Layer sichtbar zu machen. Wenn die Eigenschaft Sichtbar für einen oder mehrere Layer deaktiviert ist, erscheint ein Glühbirnensymbol in der Statusleiste.

Das Vorhängeschloßsymbol zeigt an, ob ein Layer gesperrt ist oder nicht. Wenn die Sperreigenschaft aktiviert ist, können Sie keine Elemente in dem Layer auswählen, obwohl Sie diese im Graphikfenster sehen können.

Um die Sperreigenschaft eines beliebigen Layers zu ändern, klicken Sie auf das Vorhängeschloßsymbol für den entsprechenden Layer. Klicken Sie erneut auf das Vorhängeschloßsymbol, um den Layer zur Auswahl verfügbar zu machen. Wenn die Eigenschaft Gesperrt für einen oder mehrere Layer gewählt wurde, erscheint das Vorhängeschloßsymbol in der Statusleiste.

HINWEIS: Sie können diese Eigenschaften auch mit Hilfe des Dialogfelds Layer ändern.


Ansichtsparameter-Symbolleiste

Die Ansichtsparameter-Symbolleiste stellt Steuerungssymbole für die Ansicht im Hauptgraphikfenster zur Verfügung.

Die folgenden Schaltflächen arbeiten in einem Einrastmodus. Einrastmodus bedeutet, daß der Cursor solange das ausgewählte Symbol bleibt, bis Sie ein anderes Symbol durch das Klicken auf eine andere Schaltfläche auswählen:

Schaltfläche	Wählen Sie sie, um …
	den Auswahlmodus zu ändern
	den Ansichtsmittelpunkt zu verschieben
	um den Faktor 2 zu vergrößern
	um den Faktor 2 zu verkleinern

Die folgenden Schaltflächen rasten nicht ein. Sie führen jedes Mal, wenn Sie auf diese klicken, einen Vorgang durch:

Schaltfläche	Wählen Sie sie, um …
	zur Modell-Ausdehnung zu skalieren
	zur vorherigen Einstellung zu skalieren
	die Projektleiste ein- oder auszublenden.
	Gitterlinien im Graphikfenster anzuzeigen (Sie können diese Einstellung ebenfalls im Dialogfeld Ansichtsoptionen wählen).


Ansicht-Symbolleiste

Verwenden Sie die Ansicht-Symbolleiste für folgende Vorgänge:

Diese Schaltfläche …	Wechselt zur …
	Vermessungsansicht
	Planansicht


    Filter-Symbolleiste

Die Filter-Symbolleiste steht in der Vermessungsansicht zur Verfügung. Sie enthält das Symbol Ansicht Filter und die Timeline-Schaltflächen

Schaltfläche	Verwenden Sie sie, um…
	festzulegen, welche Beobachtungen angezeigt werden sollen, und wie sie in der Vermessungsansicht dargestellt werden sollen.
	das Timeline-Fenster zu öffnen
	die Beobachtungen im Graphikfenster und Timeline zu verbinden. Wenn Sie diese Schaltfläche wählen, werden in der Software in der aktuellen Timeline-Ansicht nur nachverarbeitete Basislinien angezeigt und Basislinien die zur gleichen Zeit beobachtet wurden. Alle anderen nachverarbeiteten Basislinien in der Vermessungsansicht sind ausgeblendet.  Dies ist ein nützliches Hilfsmittel zur Auswahl unabhängiger Basislinien.


    Layer-Symbolleiste

Die Layer-Symbolleiste steht in der Planansicht zur Verfügung. Sie enthält das Symbol Layer bearbeiten und das Auswahl-Symbol Layer. Verwenden Sie diese Symbolleiste zur Verwaltung Ihrer Layer.


 Befehl Kartiercodes verarbeiten

Verwenden Sie diesen Befehl zur Verarbeitung von Kartiercodes.

Wählen Sie hierzu Hilfsmittel / Kartiercodes verarbeiten.

Das Dialogfeld Kartiercodes verarbeiten erscheint.


 Dialogfeld Kartiercodes verarbeiten

 Überblick

Verwenden Sie dieses Dialogfeld zur Verarbeitung von Kartiercodes.

Wählen Sie hierzu Hilfsmittel / Kartiercodes verarbeiten.

Merkmals- und Attributbibliothek

Wählen Sie die Merkmals- und Attributbibliothek, mit der Sie die Daten verarbeiten möchten.

Durchsuchen

Klicken Sie auf Durchsuchen, um die Merkmals- und Attributbibliothek zu bestimmen.

HINWEIS: In Trimble Geomatics Office sind alle Merkmals- und Attributbibliotheken .fcl-Dateitypen. Wenn Sie eine Merkmals- und Attributbibliothek aus einem TRIMMAP-System oder einem SDRmap-System wählen, konvertiert Trimble Geomatics Office diese Merkmals- und Attributbibliothek automatisch in einen .fcl-Dateityp.

Wenn Sie eine ‘Fclib??.dat’-Datei wählen (bei der es sich um ein Dateinamensmuster für eine Kartiercode-Bibliothek eines TRIMMAP-Systems oder SDRmap-System handelt), fragt Sie Trimble Geomatics Office bei der Verarbeitung dieser Bibliothek, ob Sie die Bibliothek konvertieren möchten. Das System fragt zudem nach einem Namen, unter dem die Bibliothek gespeichert werden soll. Der vorgeschlagene voreingestellte Name folgt dem Muster Fclib??.fcl und wird gemäß Voreinstellung im Systemordner gespeichert.

Wenn Trimble Geomatics Office Codedefinitionen ermittelt, die nicht konvertiert werden können, wird eine Warnung erteilt, daß die resultierende Bibliothek bearbeitet werden muß. Das System erstellt einen Bericht, wenn Fehler festgestellt werden.

Verarbeiten

Kartiercodes werden in der Reihenfolge verarbeitet, in der sie ausgewählt wurden.

Wählen Sie die Option Aktuelle Auswahl, um die aktuell ausgewählten Elemente zu verarbeiten.

Wählen Sie die Option Auswahlmenge und anschließend die Auswahlmenge aus der zu verarbeitenden Liste.

Die Option Aktuelle Auswahl ist nicht verfügbar, wenn keine Auswahlmenge zur Verfügung steht.

OK

Klicken Sie auf OK, um Kartiercodes zu verarbeiten.

Die Bibliothek wird verarbeitet, und die Ergebnisse der Kartierkodierung erscheinen im Graphikfenster. Sollten Fehler während der Verarbeitung auftreten, können Sie einen Fehlerbericht ansehen. Der Bericht wird zur späteren Ansicht im Ordner Berichte für das Projekt aufbewahrt.


Trimble RoadLink - Überblick
Trimble RoadLink − Überblick

Trimble RoadLink™ ist ein Trimble Geomatics Office-Programm. Es handelt sich um eine leistungsfähige Schnittstelle zwischen Kurvenbanddefinitionen anderer Herkunft und Trimble-Vermessungsgeräten

Sie verwenden es zur:

  Dateneingabe

  graphischen Ansicht von Daten

  Bearbeitung von Daten

Sie können Kurvenbanddefinitionen dann zu Trimble-Vermessungsgeräten übertragen, um diese während der Absteckung zu verwenden.

Trimble RoadLink stellt zwei Möglichkeiten zur Übertragung von Kurvenbanddefinitionen zur Verfügung:

  Automatische Konvertierung der Dateien (horizontale und vertikale Kurvenbanddateien und Querprofile), die von Software anderer Herkunft zur Verfügung gestellt werden, in Verbindung mit der manuellen Eingabe des Regelquerschnitts und der Überhöhung

  Manuelle Eingabe der Kurvenbanddefinition, einschließlich horizontaler und vertikaler Kurvenbänder, Regelquerschnitte und Überhöhung

Als eingebauter Bestandteil von Trimble Geomatics Office berechnet RoadLink zudem Abtrags- und Auftragsvolumen für Erdarbeiten zwischen der Kurvenbanddefinition und einem in Trimbles DTMLink™-Dienstprogramm definierten Oberflächenmodell.


Trimble DTMLink - Überblick
Trimble DTMLink − Überblick

Trimble DTMLink™ ist ein Trimble Geomatics Office-Programm. Dieses Programm erzeugt digitale Geländeoberflächen. Sie können mit dieser Software Oberflächen aus Softwarepaketen anderer Hersteller importieren, neue Oberflächen erzeugen und Ihre zuvor erstellten Oberflächen bearbeiten. Sie können diese Modelle zudem zur Absteckung im Feld zu Trimble-Vermessungsgeräten übertragen.

Die Software ist in der Lage, Begrenzungen und Bruchkanten in das Höhenlinienmodell einzuschließen, und bietet erweiterte Funktionen für die Bearbeitung von Dreiecken, um somit eine größere Kontrolle über die Modellbildung zu geben.

Vom Höhenlinienmodell wird ein Gitter- oder trianguliertes digitales Geländemodell für den Export in ein Gerät oder eine Datei erzeugt.

Das von Ihnen erzeugte Modell kann zudem in RoadLink für die Berechnung von Erdarbeiten verwendet werden.

Trimble DTMLink erlaubt Ihnen, Volumenberichte zu erstellen.

Typische Anwendungen für die Volumenberechnungen sind:

  Haldenberechnungen

  Volumen von Materialschichten, wie z. B. Kohlenflöze

  Volumen von Hohlräumen, wie z. B. hinter geplanten Dämmen liegende Seen

DTMLink verwendet die Methode der Berechnung von Volumen einzelner dreieckiger Prismen. Diese werden durch die dreieckigen Ebenen definiert, die das Höhenlinienmodell unter Verwendung der Basisflächen und Durchschnittshöhen der Prismen bilden.

DTMLink ermöglicht Ihnen, Vergleichsoberflächen zu erzeugen. Eine Vergleichsoberfläche ist ein Höhenlinienmodell des Unterschiedes zwischen zwei Oberflächen. Sie können diese Oberfläche in Verbindung mit dem Volumenberechnungstyp Oberhalb einer Höhe verwenden, um das Abtrags- und Auftragsvolumen zwischen den beiden Oberflächen zu berechnen.


 Befehl Start

Dieser Befehl startet Trimbles DTMLink-Dienstprogramm.

So greifen Sie darauf zu:

  Wählen Sie Hilfsmittel / DTMLink / Start.

Verwenden Sie diesen Befehl zum Starten von DTMLink, um eine 3D-Flächen-AutoCAD-DXF-Datei zu importieren, ohne eine neue Oberfläche zu erzeugen oder eine bestehende Oberfläche zu öffnen.

So führen Sie dies durch:

1.	Wählen Sie Hilfsmittel / DTMLink / Start.

2.	Wählen Sie Datei / Importieren.

Weitere Informationen finden Sie in der DTMLink-Hilfe.


 Befehl Neue Oberfläche

Verwenden Sie diesen Befehl, um ein neues Oberflächenmodell zu erzeugen.

Wählen Sie hierzu Hilfsmittel / DTMLink / Neue Oberfläche.

Das Dialogfeld Neue Oberfläche erscheint.


 Dialogfeld Neue Oberfläche

Verwenden Sie dieses Dialogfeld, um ein neues Oberflächenmodell zu erzeugen.

Wählen Sie hierzu Hilfsmittel / DTMLink / Neue Oberfläche.

Name

Geben Sie einen geeigneten Namen für die neue Oberfläche ein.

Punkte

Mit Hilfe der Option Punkte können Sie auswählen, welche Punkte aus der Projektdatenbank für die Oberflächenformation verwendet werden sollen.

  Wenn keine aktuelle Datenbankauswahl vorliegt, ist die Option Aktuelle Auswahl nicht verfügbar.

  Liegt eine aktuelle Auswahl vor, verwendet die Option Aktuelle Auswahl die Punkte in der aktuellen Auswahl zur Oberflächenformation.

Die Option Ganze Datenbank verwendet alle Punkte der Datenbank zur Oberflächenformation.

Mit Hilfe der Option Auswahlmenge können Sie eine bestehende Auswahlmenge wählen, in der die Punkte enthalten sind, die Sie zur Bildung der Oberfläche verwenden möchten.

Bruchkanten verwenden

Die Optionen Bruchkanten verwenden ermöglicht Ihnen, Linien aus der Datenbank auszuwählen, die bei der Erstellung der Oberfläche als Bruchkanten verwendet werden sollen.

Im Hinblick auf die Oberflächenerstellung sind Bruchkanten Linien, die ein konstantes Gefälle haben und somit bei der Steuerung der Modellbildung mitwirken.

Diese Optionen stehen nur zur Verfügung, wenn die Option Bruchkanten verwenden gewählt wurde. Bruchkanten verwenden muß für alle Bruchkanteninformationen gewählt werden, die an der Oberflächenerstellung beteiligt sind.

Mit Hilfe der Option Auswahlmengen können Sie Linien aus einer bestehenden Auswahlmenge als Bruchkanten bei der Oberflächenerstellung verwenden. Die Option Layer ermöglicht Ihnen, die Linien aus einem bestehenden Layer als Bruchkanten bei der Oberflächenerstellung zu verwenden. In beiden Fällen enthält die zugeordnete Liste die verfügbaren Auswahlmengen oder Layer.

Ausschließende Begrenzungen verwenden

Die Optionen Ausschließende Begrenzungen verwenden funktionieren in der gleichen Weise wie die zuvor erläuterten Optionen Bruchkanten verwenden. Mit Hilfe dieser Optionen können Sie bestimmen, daß bestehende Linien in einer Auswahlmenge oder einem Layer zur Definition einer oder mehrerer ausschließender Begrenzungen bei der Höhenlinienmodellerstellung verwendet werden.

Eine ausschließende Begrenzung ist ein Satz von Linien, der eine geschlossene Figur definiert, in der keine Oberflächendreiecke gebildet werden. Wenn die Linien, die für die Definition der ausschließenden Begrenzung bestimmt sind, keine vollständig geschlossenen Figuren bilden, werden bei der Erstellung von Höhenlinienmodellen abschließende Standardlinien hinzugefügt.

Einschließende Begrenzungen verwenden

Die Optionen Einschließende Begrenzungen verwenden funktionieren in der gleichen Weise wie die zuvor erläuterten Optionen Ausschließende Begrenzungen verwenden. Mit Hilfe dieser Optionen können Sie bestimmen, daß bestehende Linien in einer Auswahlmenge oder einem Layer zur Definition einer oder mehrerer einschließender Begrenzungen bei der Erstellung von Höhenlinienmodellen verwendet werden.

Eine einschließende Begrenzung ist ein Satz von Linien, der eine geschlossene Figur definiert, in der die Oberflächendreiecke gebildet werden. Es werden keine Dreiecke außerhalb einer definierten einschließenden Begrenzung gebildet. Wenn die Linien, die für die Definition der einschließenden Begrenzung bestimmt sind, keine vollständig geschlossenen Figuren bilden, werden bei der Erstellung von Höhenlinienmodellen abschließende Standardlinien hinzugefügt.

HINWEIS: Die Linien, die für Bruchkanten, Ausschließende Begrenzungen und Einschließende Begrenzungen verwendet werden, können Bögen und Kurven einschließen. In diesem Fall interpretiert DTMLink die Bögen oder Kurven als Reihe von kurzen, geradlinigen Segmenten, die bei der Dreiecksbildung verwendet werden. Die Software stellt sicher, daß kein Liniensegment mehr als zwei Zentimeter von der Bogen- oder Kurvenlinie entfernt ist.

Weitere Informationen über Begrenzungen und Bruchkanten finden Sie in der DTMLink-Hilfe.


 Befehl Bestehende Oberfläche

Verwenden Sie diesen Befehl, um ein bestehendes Oberflächenmodell zu bearbeiten.

Wählen Sie hierzu Hilfsmittel / DTMLink / Bestehende Oberfläche.

Das Dialogfeld Bestehende Oberfläche erscheint.


  Dialogfeld Bestehende Oberfläche

Verwenden Sie dieses Dialogfeld, um ein bestehendes Oberflächenmodell zu bearbeiten. Mit Hilfe dieses Dialogfelds können Sie Punkte und Linien im Projekt bestimmen, die Sie zu einer bestehenden Oberfläche hinzufügen möchten.

Wählen Sie hierzu Hilfsmittel / DTMLink / Bestehende Oberfläche.

HINWEIS: Wenn Sie in diesem Dialogfeld Punkte und Linien angeben, die sich bereits in der bestehenden Oberfläche befinden, wird das System dieses erkennen und sie kein zweites Mal zur Oberfläche hinzufügen.

Name

Dieses Feld gibt eine Liste von bestehenden Oberflächen in diesem Projekt wieder. Wählen Sie die Oberfläche, die Sie laden und bearbeiten möchten.

Punkte hinzufügen

Wählen Sie die Punkte aus der Projektdatenbank, die zur bestehenden Oberfläche hinzugefügt werden sollen.

Wenn keine aktuelle Datenbankauswahl vorliegt, steht die Option Aktuelle Auswahl nicht zur Verfügung.

Liegt eine aktuelle Auswahl vor, fügt die Option Aktuelle Auswahl die Punkte in der aktuellen Auswahl zur bestehenden Oberfläche hinzu.

Die Option Ganze Datenbank überträgt alle aktuellen Punkte in der Datenbank in das Oberflächenmodell. Damit können Sie alle neuen Punkte in der Datenbank automatisch zum Modell hinzufügen.

Mit Hilfe der Option Auswahlmengen können Sie eine bestehende Auswahlmenge wählen, die die Punkte enthält, die Sie zur bestehenden Oberfläche hinzufügen möchten.

Bruchkanten hinzufügen

Die Optionen Bruchkanten hinzufügen ermöglichen Ihnen, Linien aus der Datenbank auszuwählen, die zu den bereits in der bestehenden Oberfläche vorhandenen Bruchlinien hinzugefügt werden. Diese Optionen sind nur verfügbar, wenn die Option Bruchkanten hinzufügen gewählt wurde.

Bruchkanten hinzufügen muß für alle Bruchkanteninformationen gewählt werden, die zur bestehenden Oberfläche hinzugefügt werden sollen. Im Hinblick auf die Erstellung des Oberflächenmodells sind Bruchkanten Linien, die ein konstantes Gefälle haben und somit bei der Steuerung der Modellformation mitwirken.

Mit Hilfe der Option Auswahlmengen können Sie die Linien aus einer bestehenden Auswahlmenge als Bruchkanten zur bestehenden Oberfläche hinzufügen.

Die Option Layer ermöglicht Ihnen, die Linien aus einem bestehenden Layer als Bruchkanten zur bestehenden Oberfläche hinzuzufügen.

In beiden Fällen stellt enthalten die Listen die verfügbaren Auswahlmengen oder Layer.

Ausschließende Begrenzungen hinzufügen

Die Optionen Ausschließende Begrenzungen hinzufügen funktionieren in der gleichen Weise wie die zuvor erläuterten Optionen Bruchkanten hinzufügen.

Mit Hilfe dieser Optionen können Sie bestimmen, daß bestehende Linien in einer Auswahlmenge oder einem Layer als ausschließende Begrenzungslinien zur Definition der ausschließenden Begrenzung in der bestehenden Oberfläche hinzugefügt werden.

Eine ausschließende Begrenzung ist ein Satz von Linien, der eine geschlossene Figur definiert, in der keine Oberflächendreiecke gebildet werden.

Wenn die Linien, die für die Definition der ausschließenden Begrenzung bestimmt sind, keine vollständig geschlossenen Figuren bilden, werden bei der Erstellung des Höhenlinienmodells abschließende Standardlinien hinzugefügt.

Einschließende Begrenzungen hinzufügen

Die Optionen Einschließende Begrenzungen hinzufügen funktionieren in der gleichen Weise wie die zuvor erläuterten Optionen Ausschließende Begrenzungen hinzufügen.

Mit Hilfe dieser Optionen können Sie bestimmen, daß bestehende Linien in einer Auswahlmenge oder einem Layer als einschließende Begrenzungslinien zur Definition der einschließenden Begrenzung in der bestehenden Oberfläche hinzugefügt werden.

Eine einschließende Begrenzung ist ein Satz von Linien, der eine geschlossene Figur definiert, in der die Oberflächendreiecke gebildet werden. Es werden keine Dreiecke außerhalb von definierten einschließenden Begrenzungen gebildet.

Wenn die Linien, die für die Definition der einschließenden Begrenzung bestimmt sind, keine vollständig geschlossenen Figuren bilden, werden bei der Erstellung von Höhenlinienmodellen abschließende Standardlinien hinzugefügt.

HINWEIS: Die Linien, die für Bruchkanten, Ausschließende Begrenzungen und Einschließende Begrenzungen verwendet werden, können Bögen und Kurven einschließen. In diesen Fällen interpretiert DTMLink die Bögen oder Kurven als Reihe von kurzen, geradlinigen Segmenten, die bei der Dreiecksbildung verwendet werden. Die Software stellt sicher, daß kein Liniensegment mehr als zwei Zentimeter von der Bogen- oder Kurvenlinie entfernt ist.

Weitere Informationen über Begrenzungen und Bruchkanten finden Sie in der DTMLink-Hilfe.


 Befehl Start

Dieser Befehl startet Trimbles RoadLink-Dienstprogramm. Verwenden Sie diese Software, um Kurvenbanddefinitionen zu importieren oder manuell einzugeben und  sie für die Absteckung zu Trimble-Vermessungsgeräten zu übertragen.

So greifen Sie darauf zu:

   Wählen Sie Hilfsmittel / RoadLink / Start.


 Befehl Exportieren

Verwenden Sie diesen Befehl, um Punkte aus einer Auswahlmenge, der ganzen Datenbank oder der aktuellen Auswahl in RoadLink zu exportieren.

So greifen Sie darauf zu:

  Wählen Sie Hilfsmittel / RoadLink / Exportieren.

Das Dialogfeld Exportieren erscheint.


 Dialogfeld Exportieren

Verwenden Sie dieses Dialogfeld, um Punkte aus einer Auswahlmenge, der ganzen Datenbank oder der aktuellen Auswahl in RoadLink zu exportieren. Die Darstellung von bestehenden Datenbankpunkten in RoadLink kann bei der Eingabe oder Überprüfung einer Kurvenbanddefinition behilflich sein.

So greifen Sie darauf zu:

  Wählen Sie Hilfsmittel / RoadLink / Exportieren.

Punkte

Wählen Sie den Satz von Punkten.

Drei Optionen stehen zur Verfügung:

Aktuelle Auswahl	Exportiert ausgewählte Punkte
Ganze Datenbank	Exportiert alle Datenbankpunkte
Auswahlmenge	Wählt die Auswahlmenge aus der Liste.

Weitere Informationen finden Sie in der RoadLink-Hilfe.


Warenzeichen

Das Globus- & Dreieck-Logo, Trimble, Convert to RINEX, Coordinate System Manager, Data Transfer, DC File Editor, DTMLink, Feature and Attribute Editor, Grid Factory, GPSurvey, Line Type Editor, RoadLink, Symbol Editor, Trimble Geomatics Office, Trimble Survey Controller, Trimble Survey Office, Trimble Total Control, TRIMMAP, TRIMNET, TSC1 und TSCe sind Warenzeichen von Trimble Navigation Limited.

Das Sextanten-Logo mit Trimble, Geodimeter und GPS Pathfinder sind beim US Patent and Trademark Office eingetragene Warenzeichen von Trimble Navigation Limited.

Alle anderen Marken oder Produktnamen sind Warenzeichen ihrer entsprechenden Eigentümer.

Standard Template Library, © 1994 Hewlett-Packard Company, Standard Template Library, © 1996,97 Silicon Graphics Computer Systems, Inc., Standard Template Library, © 1997 Moscow Center for SPARC Technology.


Befehl Projekt verdichten & reparieren

Verwenden Sie diesen Befehl, um die Projektdatenbank zu verdichten und zu reparieren.

So greifen Sie darauf zu:

  Wählen Sie Programme / Projekt verdichten & reparieren.

Das Dialogfeld Projekt verdichten & reparieren wird geöffnet.


Dialogfeld Projekt verdichten & reparieren

Verwenden Sie dieses Dialogfeld, um die Projekt-Datenbank zu verdichten und zu reparieren.

Verdichten

Durch das Verdichten wird Festplattenspeicher eingespart und die Software-Leistung erhöht. Sie sollten Ihre Projekt-Datenbank regelmäßig verdichten.

Reparieren

Ihre Datenbank kann beschädigt werden, wenn es z. B. zu einem Stromausfall kommt, während Trimble Geomatics Office läuft.

Wenn Sie die Datenbank bearbeiten, und Trimble Geomatics Office unerwartet geschlossen wird, könnte die letzte an der Datenbank vorgenommene Änderung verloren gehen, wenn Sie die Datenbank reparieren. Sie müssen das Projekt erneut öffnen, zu der Stelle zurückkehren, an der die Bearbeitung vorgenommen wurde und prüfen, ob die Änderungen gespeichert wurden.

So greifen Sie auf das Dialogfeld Projekt verdichten & reparieren zu:

1.	Wählen Sie Programme / Projekt verdichten & reparieren.

2.	Wählen Sie das Projekt, das verdichtet und repariert werden soll

Eine Fehlermeldung erscheint, wenn die Projekt-Datenbank nicht verdichtet oder repariert werden kann.

TIP: Wenn die Festplatte Ihres Computers nicht defragmentiert ist, defragmentieren Sie sie, bevor Sie die Datenbank verdichten.


Trimble Geomatics Office-Programme

Die folgenden Trimble Geomatics Office-Dienstprogramme sind in Verbindung mit der Installationsoption Standard in Trimble Geomatics Office verfügbar:

Trimble Coordinate System Manager™-Programm

Trimble Convert to RINEX™-Programm

Trimble Data Transfer-Programm

Trimble DC File Editor™-Programm

Trimble Feature and Attribute Editor™-Programm

Trimble Line Type Editor™-Programm

Planning-Programm

Trimble Symbol Editor™-Programm

Trimble A1 Viewer-Programm

HINWEIS: Das Trimble Grid Factory™-Programm ist mit der benutzerdefinierten Installationsoption verfügbar.

Weitere Informationen finden Sie im Trimble Geomatics Office-Benutzerhandbuch.

Programme hinzufügen

So fügen Sie zusätzliche Programme zum Programm-Menü hinzu:

1.	Verwenden Sie den Microsoft Windows Explorer, um ...\Programme\Trimble\Trimble Geomatics Office\Utility zu finden.

2.	Klicken Sie mit der rechten Maustaste auf eine freie Stelle im rechten Explorer-Fenster.

3.	Wählen Sie die Option Neu / Verknüpfung.

Dies öffnet den Assistenten Verknüpfung erstellen.

4.	Um die Verknüpfung einzurichten, geben Sie den Pfad für das Programm ein, das Sie zum Programm-Menü hinzufügen möchten.

5.	Klicken Sie auf Weiter, und füllen Sie das Feld ‘Wählen Sie eine Bezeichnung für die Verknüpfung’ aus, um die Bezeichnung für das Programm zu definieren, die im Programm-Menü angezeigt werden soll.

Das nächste Mal, wenn Trimble Geomatics Office ausgeführt wird, erscheint die Verknüpfung für das Programm, das Sie hinzugefügt haben, im Programm-Menü.


Symbol Editor

Mit dem Programm Trimble Symbol Editor™ können Sie Punktsymbol-Bibliotheken (*.sym) bearbeiten, die von Trimble Geomatics Office verwendet werden.

Führen Sie einen der folgenden Schritte durch, um auf dieses Programm zuzugreifen:

  Wählen Sie Programme / Symbol Editor, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Verwenden Sie dieses Programm, wenn Sie Punktsymbole erzeugen oder bestehende Punktsymbole ändern möchten. Wenn Sie die bearbeitete Datei als System-Datei registriert haben, stehen die Symbole, die Sie erzeugen, zur Verfügung, wenn Sie Punktstile in Trimble Geomatics Office oder dem Trimble Feature and Attribute Editor-Programm hinzufügen oder modifizieren.

Ein Punktstil

 ist eine Definition, die erläutert, wie ein Punkt in Trimble Geomatics Office gezeichnet wird

 enthält ein Symbol, das im Symbol Editor-Programm erzeugt wurde.

Die Erzeugung eines Symbols im Symbol Editor/Programm stellt das Symbol nicht automatisch als Punktstil in Trimble Geomatics Office zur Verfügung. Einem Punkt wird ein Punktstil zugeordnet, jedoch kein Symbol. Ein Punktstil muß unter Verwendung des neu erzeugten Symbols definiert werden.

Der Symbol Editor wird automatisch mit der aktuellen Symbol-Bibliothek, die Trimble Geomatics Office verwendet, geöffnet. Die Namen der Symbole in der geöffneten Bibliothek werden in einer Liste auf dem Bildschirm dargestellt. Verwenden Sie diese Liste, um das Symbol, das Sie bearbeiten möchten, auszuwählen.

Sie können den Editor unabhängig von Trimble Geomatics Office ausführen. Wählen Sie das Verknüpfungssymbol für den Symbol Editor aus dem Trimble Geomatics Office-Ordner aus.

HINWEIS: Wenn Sie den Editor unabhängig von Trimble Geomatics Office ausführen, sind die Änderungen, die Sie am aktuellen Symboltyp vornehmen, in keinem gegenwärtig geöffneten Projekt enthalten. Schließen und öffnen Sie Ihr Projekt erneut, um diese Änderungen anzuwenden. Die gespeicherten Änderungen stehen danach in der Symbol-Bibliothek zur Verfügung.

Weitere Informationen finden Sie in der Hilfe des Trimble Symbol Editor-Programms.


Line Type Editor

Mit dem Programm Trimble Line Type Editor™ können Sie Linientyp-Bibliotheken (*.ltp) bearbeiten, die von Trimble Geomatics Office verwendet werden.

Führen Sie einen der folgenden Schritte durch, um auf dieses Programm zuzugreifen:

 Wählen Sie Programme / Line Type Editor, wenn kein Projekt geöffnet ist.

   Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Verwenden Sie dieses Programm, wenn Sie Linientypen erzeugen oder bestehende Linientypen ändern möchten. Wenn Sie die bearbeitete Datei als System-Datei registriert haben, stehen die Linientypen, die Sie erzeugen, zur Verfügung, wenn Sie Linienstile in Trimble Geomatics Office oder dem Feature and Attribute Editor-Programm hinzufügen oder modifizieren.

Ein Linienstil

  ist eine Definition, die vorschreibt, wie eine Linie in Trimble Geomatics Office gezeichnet wird

  enthält einen Linientyp, der im Line Type Editor Programm erzeugt wurde.

Die Erzeugung eines Linientyps im Line Type Editor-Programm stellt diesen nicht automatisch als einen Linientyp in Trimble Geomatics Office zur Verfügung. Einer Linie wird ein Linienstil zugeordnet. Ein Linienstil muß unter Verwendung des neu erzeugten Linientyps definiert werden.

Das Line Type Editor-Programm wird automatisch mit der aktuellen Symbol-Bibliothek, die Trimble Geomatics Office verwendet, geöffnet. Die Namen der Linientypen in der geöffneten Bibliothek erscheinen in einer Liste auf dem Bildschirm. Verwenden Sie diese Liste, um Linientypen zu bearbeiten.

Sie können den Editor unabhängig von Trimble Geomatics Office ausführen. Wählen Sie das Verknüpfungssymbol für das Programm Line Type Editor aus dem Trimble Geomatics Office-Ordner aus.

HINWEIS: Wenn Sie den Editor unabhängig von Trimble Geomatics Office ausführen, sind die Änderungen, die Sie an der Linientyp-Bibliothek des Systems vornehmen, nicht im aktuelle geöffneten Projekt enthalten. Schließen und öffnen Sie Ihr Projekt erneut, um diese Änderungen anzuwenden, nachdem Sie die Änderungen an der Linientyp-Bibliothek gespeichert haben. Die gespeicherten Änderungen stehen dann in der Linientyp-Bibliothek zur Verfügung.

Weitere Informationen finden sie in der Hilfe des Trimble Line Type Editor-Programms.


Grid Factory

Verwenden Sie die benutzerdefinierte Installationsoption, um das Trimble Grid Factory™-Programm zu installieren.

Führen Sie einen der folgenden Schritte durch, um auf dieses Programm nach der Installation zuzugreifen:

  Wählen Sie Programme / Grid Factory, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Verwenden Sie das Trimble Grid Factory-Programm, um mit Datum-Gitternetz (*.dgf)-Dateien und Geoid-Gitternetz (*.ggf)-Dateien zu arbeiten.

Verwenden Sie dieses Programm, um Untergitter von bestehenden Gitternetzen zu erzeugen oder bestehende Mehrfachgitter in einem Einzelgitter zu kombinieren. Sie können Datum-Gitternetz-Dateien und Geoid-Gitternetz-Dateien unter Verwendung Trimble Geomatics Office untergittern.

Wenn Sie das Grid Factory-Programm verwenden, um Geoid-Gitternetz-Dateien zu erstellen, stellen Sie sicher, daß die Bezeichnung, die Sie für die neue Datei eingeben, dieselbe ist wie die Geoid-Modell-Bezeichnung, die Sie im Trimble Coordinate System Manager™-Programm erstellen.

Gitternetze sind großflächig, wenn die abgedeckte geographische Fläche großflächig ist.

Das OSU91-Geoid-Gitternetz hat z. B. eine Größe von etwa 2 MB. Datenrekorder und Empfänger verfügen gewöhnlich nicht über ausreichenden freien Speicherplatz, um diese Datenmenge aufzunehmen. Das OSU91-Gitternetz deckt die gesamte Erdoberfläche ab, aber die meisten Vermesser benötigen solch eine große Abdeckung nicht. Vermesser benötigen in der Regel nur Flächen von zwischen zehn und mehreren hundert Quadratkilometern. Ein Gitternetz, das eine kleinere Fläche abdeckt, nimmt normalerweise nur einige hundert Bytes ein.

Mit Grid Factory können Sie Untergitter-Dateien von Geoid-Modellen erzeugen, die einen lokalen Bereich umfassen. Diese Dateien sind klein genug, um in ein Trimble Survey Controller-Gerät  (Version 6 oder höher) geladen zu werden.

Viele Trimble-Produkte werden mit Gitternetz-Dateien für die Konvertierung von Datums und Geoid-Modellen geliefert, die Sie im Grid Factory-Programm verwenden können. Das Grid Factory-Programm importiert zudem fremde Gitternetz-Dateien und wandelt diese in das Trimble Gitternetzformat um.

Weitere Informationen finden Sie in der Hilfe des Trimble Grid Factory-Programms.


DC File Editor

Mit dem Trimble DC File Editor™-Programm können Sie Survey Controller (*.dc)-Dateien bearbeiten.

Führen Sie einen der folgenden Schritte durch, um auf dieses Programm zuzugreifen:

  Wählen Sie Programme / DC File Editor, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

HINWEIS: Trimble empfiehlt, daß Sie sämtliche Bearbeitungsvorgänge in Trimble Geomatics Office abschließen. Dies stellt sicher, daß Sie immer zu der ursprünglichen Geräte-Datei zurückkehren können, falls bei der Bearbeitung in Trimble Geomatics Office Probleme auftreten.

Verwenden Sie Trimbles DC File Editor-Programm, um Dateien von den folgenden Geräten zu bearbeiten:

  Trimble

  Sokkia SDR  (bis Version 4-03)

  Jede Geräte-Datei, die in das SDR-Format konvertiert werden kann

Mit dem DC File Editor-Programm können Sie den Inhalt einer DC-Datei bearbeiten. Sie können z. B. fehlerhafte Daten ändern, die im Feld aufgezeichnet wurden, oder Informationen hinzufügen, die im Feld nicht verfügbar waren.

HINWEIS: Sie können Attribute nicht bearbeiten oder die Merkmals- und Attributbibliotheksinformationen ändern.

Weitere Informationen finden Sie in der Hilfe des Trimble DC File Editor-Programms.


Feature and Attribute Editor

Verwenden Sie das Trimble Feature and Attribute Editor™-Programm, um Merkmals- und Attributbibliotheksdateien (*.fcl) für die Kartiercode-Verarbeitung und  aufgezeichnete GIS-Attributdaten zu verwalten.

Führen Sie einen der folgenden Schritte durch, um auf dieses Programm zuzugreifen:

  Wählen Sie Programme / Feature and Attribute Editor, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Verwenden Sie das Trimble Feature and Attribute Editor-Programm, um Merkmals- und Attributbibliotheksdateien anzusehen oder zu bearbeiten. Eine Merkmals- und Attributbibliothek wird verwendet für:

  die Kartiercode-Verarbeitung

  die Attributaufzeichnung

Eine .fcl-Datei ist eine Text-Datei, die die Definitionen von Merkmalen, CAD-Stilen und Steuercodes enthält. Eine Merkmalsdefinition kann folgendes enthalten:

  einen Code für das Merkmal

  die CAD-Vorgänge, die bei Punkten auszuführen sind, die mit diesem Merkmal assoziiert sind

  die für dieses Merkmal erforderlichen Attribute

Sie können neue Merkmals- und Attributbibliotheken erstellen. Sie können zudem die voreingestellte Merkmals- und Attributbibliothek von Trimble Geomatics Office in ihrer gegenwärtigen Form verwenden, oder Sie können die Bibliothek nach Ihren Wünschen ändern.

Weitere Informationen finden Sie in der Hilfe des Trimble Feature and Attribute Editor-Programms.


Coordinate System Manager

Das Trimble Coordinate System Manager™-Programm ermöglicht Ihnen den Zugriff auf Ihre Koordinatensystem-Datenbank (Current.csd).

Führen Sie einen der folgenden Schritte aus, um auf dieses Programm zuzugreifen:

  Wählen Sie Programme / Coordinate System Manager, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Mit dem Trimble Coordinate System Manager-Programm können Sie neue:

  Ellipsoidparameter

  Datum-Transformationen

  Koordinatensysteme

  Örtliche Anpassungsdefinitionen

  Geoid-Modelle definieren

HINWEIS: Die meisten Benutzer müssen das Trimble Coordinate System Manager-Programm nicht verwenden, da Trimble einen umfangreichen Satz vordefinierter Koordinatensystemdefinitionen zur Verfügung stellt. Verwenden Sie das Trimble Coordinate System Manager-Programm nur dann, wenn Sie eine zusätzliche Koordinatensystemdefinition hinzufügen möchten.

Trimble Geomatics Office verwendet die Koordinatensystem-Datenbank, um zu ermitteln, welche Koordinatensysteme, Geoid-Modelle und Örtlichen Anpassungen in einem Projekt zur Verfügung stehen.

HINWEIS: Örtliche Anpassungen können in Trimble Geomatics Office oder dem Koordinatensystem-Manager-Programm erzeugt werden. Sie werden in der geodätischen Datenbank gespeichert.

Weitere Informationen finden Sie in der Hilfe des Trimble Coordinate System Manager-Programms oder im Trimble Geomatics Office-Benutzerhandbuch.


Planning

Das Planning-Programm ist ein Programm, das Ihnen bei der Planung und Einteilung von GPS-Sitzungen im Feld behilflich ist. Setzen Sie Planning vor jeder geplanten GPS-Sitzung ein, um herauszufinden, inwieweit die Bedingungen für das Vermessen mit GPS geeignet sind.

Führen Sie einen der folgenden Schritte durch, um auf das Planning-Programm zuzugreifen:

  Wählen Sie Programme / Planning, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Die Projektplanung ist gewöhnlich die erste Verwaltungsphase eines Vermessungsprojekts. Das Ziel der Projektplanung ist es, alle wichtigen Aspekte des Projekts zu definieren, so daß das Projekt unter allen vorhersehbaren Bedingungen effektiv und effizient durchgeführt werden kann. Wenn Sie Echtzeit-kinematische Vermessungen (RTK) durchführen:

  Verwenden Sie das Planning-Programm, um zu überprüfen, ob mindestens vier Satelliten zur Verfügung stehen, um eine Initialisierung über einem bekannten Punkt zu ermöglichen, und fünf Satelliten für das Gelingen einer OTF-Initialisierung.

  Überprüfen Sie die PDOP-Werte, um festzustellen, ob die geometrischen Satellitenbedingungen für genaue Echtzeit-Positionierungen geeignet sind.

HINWEIS: Das Planning-Programm steht nicht in direktem Zusammenhang mit einem Trimble Geomatics Office-Projekt und speichert keine Sitzungsbeschreibungen. Sie können diese nur definieren und verwenden, wenn Trimble Geomatics Office gleichzeitig ausgeführt wird.

Das Planning-Programm kann Ihnen behilflich sein, um:

  die Satellitenverfügbarkeit mit Hilfe von Tabellen und graphischen Anzeigen visuell darzustellen und vorherzusagen

  mit der Auswahl von Satelliten, Almanachs, Zeitzonen, Sichtbehinderungen örtlicher Anpassungen und Höhenmasken zu experimentieren

  die besten Beobachtungszeiträume für eine vorgegebene Sitzung zu bestimmen, unter Vorgabe aller notwendigen Beschränkungen hinsichtlich des PDOP und des Arbeitszeitraums des Feldteams.

Weitere Informationen finden Sie in der Hilfe des Planning-Programms.


Convert to RINEX Programm
Convert to RINEX

Das Receiver INdependent EXchange (RINEX)-Format ist eine ASCII-Repräsentation der von Empfängern aufgezeichneten GPS-Daten. Das Programm Convert to RINEX konvertiert eine binäre .dat-Datei, die unter Verwendung von Trimble-Vermessungsempfängern aufgezeichnet wurde, in ASCII RINEX-Formatdateien. Sie können das Programm unabhängig von Trimble Geomatics Office ausführen.

Führen Sie einen der folgenden Schritte durch, um auf das Convert to RINEX-Programm zuzugreifen:

  Wählen Sie Programme / Convert to RINEX, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

Verwenden Sie das Programm, um:

  Dateien für die Konvertierung zu wählen

  die Konvertierungsparameter zu konfigurieren

  die Ausgabe-Dateiinformation für Antennen und Kopfzeilen zu konfigurieren

  die gewählten Dateien in das RINEX-Format umzuwandeln.

Das Programm Convert to RINEX kann drei Typen von RINEX-Dateien erzeugen:

  Beobachtungsdateien (GPS-Rohbeobachtungen mit Standpunkt-Antenneninformationen)

  Navigationsdateien (GPS-Umlaufbahnen)

  Meteorologische Dateien (Druck, Temperatur und relative Luftfeuchtigkeit)

Das Programm erstellt RINEX-Beobachtungs- und Navigationsdateien gemäß Voreinstellung. Sie können zudem wählen, ob Sie eine Meteorologische RINEX-Datei erstellen möchten.

Weitere Informationen finden Sie in der Hilfe des Trimble Convert to RINEX-Programms.


A1 Viewer

Mit dem A1 Viewer-Dienstprogramm können Sie den Inhalt einer GPSurvey Projektarchiv-Datei (*.A1) ansehen und die ausgewählten Dateien in ein Zielverzeichnis extrahieren (speichern). Das A1 Viewer-Programm kann unabhängig von GPSurvey ausgeführt werden, Sie müssen GPSurvey also nicht auf Ihrem Computer installieren. Nachdem Sie die GPSurvey-Projektdateien gespeichert haben, können Sie die Importfunktionen von Trimble Geomatics Office verwenden, um Daten in das aktuelle Projekt zu importieren.

Führen Sie einen der folgenden Schritte durch, um auf das  A1 Viewer Dienstprogramm zuzugreifen:

  Wählen Sie Programme / A1 Viewer, wenn kein Projekt geöffnet ist.

  Wählen Sie es jederzeit aus dem Microsoft Windows Startmenü.

GPSurvey Koordinatenimportoption

Mit der GPSurvey Koordinatenimportoption (GPSurvey-Koordinaten [curr_net.dat] ) können Sie ausgeglichene Koordinaten aus einer Curr_net.dat-Datei importieren. So greifen Sie diese Software zu:

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option GPSurvey-Koordinaten (Curr_net.dat), und klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

HINWEIS: Die Datei muß den Namen curr_net.dat haben, damit sie importiert werden kann.

3.	Navigieren Sie zur Datei, und klicken Sie auf OK.

Sie können nun ausgeglichenen Koordinaten aus einer Curr_net.dat-Datei importieren.

Dateien, die vom A1 Viewer-Programm unterstützt werden

Nur Dateien, die in GPSurvey archiviert wurden, können angesehen werden:

  .ssf/.ssk-Dateien − diese Dateien enthalten Basislinienlösungen aus dem GPSurvey WAVE Programm. Sie werden unter Verwendung des Importformats SSF/SSK-Dateien (*.ssf,*.ssf) in Trimble Geomatics Office importiert. Dieses Format steht im Register Vermessung des Dialogfelds Importieren zur Verfügung.

  GPS-Dateien −  diese Dateien enthalten die GPS-Rohdaten, die im Feld erfaßt wurden. Die beiden Dateitypen —*.dat (GPS-Rohdateien von einem Trimble-Empfänger) und *.rnx (RINEX-Rohdateien, die zur Verwendung im WAVE-Programm konvertiert wurden)—stehen zur Verfügung, wenn dieser Filter gewählt wird. Beide Dateitypen (.dat und .rnx) werden ebenfalls unter Verwendung des Importformats GPS-Dateien (*.dat) in ein Projekt importiert.

HINWEIS: Wählen Sie im Feld Dateityp die Option Alle Dateien*.*, um die verfügbaren *.rnx-Dateien im Dialogfeld Öffnen für das GPS-Datei-Importformat anzusehen.

  Dateien mit ausgeglichenen Koordinaten – diese Dateien, Curr_net.dat und Coords.log, enthalten die ausgeglichenen Dateien aus einem archivierten GPSurvey-Projekt. Die Datei Curr_net.dat wird zum Importieren der Koordinaten in Trimble Geomatics Office verwendet. Die Datei Coords.log ist eine schreibgeschützte Datei im ASCII-Format, und kann nur mit einem Text-Editor angesehen werden. Die Punkte im GPSurvey-Projekt können als geographische oder Gitter-Koordinaten eines beliebigen Koordinatensystems sein. Damit die Daten richtig importiert werden können, müssen die Koordinatensystemeigenschaften des Trimble Geomatics Office-Projekts genau mit den Koordinatensystemeigenschaften des GPSurvey-Projekts übereinstimmen.

Die Datei (Curr_net.dat) wird unter Verwendung des GPSurvey Koordinatenimportformats (Curr_net.dat) importiert. Wenn die Datei (Curr_net.dat) gelesen wird, erkennt die Software, welche Koordinaten bei der Ausgleichung in GPSurvey festgehalten wurden. Die Datei muß mindestens eine festgehaltene (bedingte) Koordinatenkomponente (HR, h, ellh) enthalten, damit alle Koordinatenkomponenten desselben Typs importiert werden. So ist z. B. eine bedingte orthometrische Höhe erforderlich, damit alle orthometrischen Höhen importiert werden können. Allen importierten Koordinatenkomponenten wird Festpunktqualität zugewiesen.

  .ggf-Dateien −  diese Dateien enthalten die Geoid-Daten örtlicher Geoid-Gitternetz-Dateien (*.ggf), die in einem GPSurvey-Projekt erzeugt oder in ein GPSurvey-Projekt importiert wurden. Sie werden unter Verwendung der Residual Geoid Modeling-Funktion in TRIMNet Plus erzeugt. Die in GPSurvey verfügbaren Globalen GGF-Dateien (z. B. WW15MGH, GEOID99) können nicht mit diesem Filter angezeigt werden. Speichern Sie die GGF-Dateien im Ordner Programme\Gemeinsame Dateien\Trimble\GeoData, und verwenden Sie das Coordinate System Manager Dienstprogramm, um das Geoid zur Koordinatensystem-Datenbank hinzuzufügen und die Daten in Trimble Geomatics Office zu verwenden. Verwenden Sie dann das Coordinate System Manager-Programm, um das Geoid zur Koordinatensystemdatenbank hinzuzufügen. Weitere Informationen über die Verwendung dieses Programms finden Sie in der Hilfe des Coordinate System Managers.

Den One-Height Mode in TRIMNet Plus verwenden

Wenn GPSurvey-Koordinaten aus einem Projekt unter Verwendung des One-Height Mode (Eine-Höhe-Modus) in TRIMNet Plus importiert werden, enthält das Feld Ellips Höhe im Trimble Geomatics Office Projekt den Wert der orthometrischen Höhe. Dies ist der Fall, da in TRIMNet Plus das Feld Ellipsoide Höhe bei einer Ausgleichung im Eine-Höhe-Modus für die Höhe (orthometrische Höhe) verwendet wird. Wenn Sie wissen möchten, welcher Modus für ein GPSurvey Projekt verwendet wurde, empfiehlt Trimble, das Projekt in GPSurvey zu öffnen und die Special Control- (Besondere Steuerungs-)Einstellungen in TRIMNet Plus zu überprüfen.

Genaue Ephemeriden verwenden

Mit der GPSurvey Projekt-Archivierungsfunktion können keine Genauen Ephemeriden archiviert werden, die bei der Basislinienverarbeitung verwendet wurden. Wenn Genaue Ephemeriden bei der Basislinienverarbeitung im GPSurvey-Projekt verwendet wurden, müssen Sie die Genauen Ephemeriden aus der ursprünglichen Quelle in Trimble Geomatics Office importieren.


NGS-Antennemodelle
NGS-Antennenmodelle

Sie können zwei Antennenmodellsätze —Trimble oder NGS— mit Trimble Geomatics Office verwenden. Welchen Satz von Antennen Sie verwenden, hängt von den Vermessungsanforderungen ab. Normalerweise wird der NGS-Antennenmodellsatz benutzt, wenn Sie andere Antennentypen verwenden, als die, die in der Datei Antenna.ini definiert sind.

Der Trimble Antennensatz ist gemäß Voreinstellung installiert. Wenn Sie NGS-Antennenmodelle im Register Global des Dialogfelds GPS-Baselinienverarbeitungsstile installieren möchten, wählen Sie die Option NGS aus der Liste der Antennenmodelle.


 Befehl Vermessungsansicht

Verwenden Sie diesen Befehl, um das Projekt in der Vermessungsansicht anzusehen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Vermessung.

 Wählen Sie das Symbol Vermessungsansicht.


Vermessungsansicht - Überblick
 Vermessungsansicht − Überblick

 Siehe auch

Sie können ein Projekt entweder in der Vermessungsansicht oder in der Planansicht ansehen.

Verwenden Sie die Vermessungsansicht, um vermessungsbezogene Aufgaben durchzuführen, wie:

  die Überprüfung von GPS- und terrestrischen Beobachtungen

  das Korrigieren von fehlerhaften Daten.

Einige Menüoptionen und Symbolleisten stehen nur in der Vermessungsansicht zur Verfügung. Sie erlauben Ihnen, vermessungsbezogene Aufgaben durchzuführen, wie z. B. die Basislinienverarbeitung und Netzausgleichung.

TIP: Um verschiedene Teile des Projekts zur gleichen Zeit anzusehen, erzeugen Sie mehrere Fenster. Weitere Informationen finden Sie unter Befehl Neues Fenster.

Ansicht von Vermessungsdaten

In der Vermessungsansicht werden GPS- und terrestrische Beobachtungen als Linien dargestellt.

Doppelklicken Sie auf eine Beobachtungslinie, um die Beobachtung unter Verwendung des Eigenschaftsfensters anzusehen, und bearbeiten Sie die Beobachtung, wenn erforderlich. Es werden Fehlerkennzeichnungen an Punkten oder Beobachtungen dargestellt, wenn ein Abschlußfehler außerhalb der Toleranz auftritt oder eine GPS-Beobachtung am Zurückweisungskriterium scheitert.

Unterschiedliche Linienfarben geben den jeweiligen Status wieder, der von der Einstellung Stil Legende im Dialogfeld Ansichtsoptionen / Register Vermessungslegende abgeleitet wird. Festpunkte und ausgeglichene Punkte haben ebenfalls spezielle Darstellungen in der Vermessungsansicht.

In der Vermessungsansicht verfügbare Aufgaben

Die folgenden Aufgaben stehen in der Vermessungsansicht zur Verfügung:

  Ansicht Filter

  Beobachtungen wählen

  Optionen für GPS-Schleifenschlußberichte

Es stehen weitere vermessungsbezogene Aufgaben zur Verfügung, wenn Sie das Basislinienverarbeitungsmodul und das Netzausgleichungsmodul installiert haben. Die folgenden Tabellen zeigen die Aufgaben an, die zusätzlich durch jedes Modul verfügbar sind.

Basislinienverarbeitungsmodul

Netzausgleichungsmodul

Ansichten ändern

Sie können Ansichten jederzeit ändern.

Führen Sie einen der folgenden Schritte aus, um zur Planansicht zu wechseln:

 Wählen Sie das Symbol Planansicht.

  Wählen Sie Ansicht / Plan.


 Befehl Planansicht

Verwenden Sie diesen Befehl, um das Projekt in der Planansicht anzusehen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Plan.

  Wählen Sie das Symbol Planansicht.


Planansicht - Überblick
    Planansicht − Überblick

Siehe auch

Sie können ein Projekt entweder in der Planansicht oder in der Vermessungsansicht ansehen.

Verwenden Sie die Planansicht, um die topographischen Merkmale anzusehen, die während der Feldvermessung beobachtet wurden.

Sie können Punkte, Linien, Stile und Anmerkungen hinzufügen, um die Darstellung des Projekts zu verbessern. Alle Änderungen, die Sie in der Planansicht vornehmen, haben keinen Einfluß auf die zugrundeliegenden Vermessungsbeobachtungen.

Einige Menüoptionen und Symbolleisten stehen nur in der Planansicht zur Verfügung. Mit Hilfe dieser Optionen können Sie CAD-bezogene Aufgaben (wie Kartierkodierung, Layer-Steuerung und Stilverwaltung) durchführen.

TIP: Um unterschiedliche Teile des Projekts zur gleichen Zeit anzusehen, erzeugen Sie mehrere Fenster. Weitere Informationen finden Sie unter Befehl Neues Fenster.

Elemente (Punkte, Linien, Kurven, Bögen, Text und Anmerkungen) werden entsprechend des ihnen zugewiesenen Stils dargestellt. Sie können den Stil eines Elementes durch Kartierkodierung oder mit Hilfe des Eigenschaftsfensters ändern. GPS- und konventionelle Beobachtungen werden nicht dargestellt. Wenn Sie eine Linie in der Planansicht hinzufügen, fügen Sie ein neues Element zur Datenbank hinzu.

Wenn Sie zur Vermessungsansicht wechseln, werden keine CAD-Linien dargestellt.

Wenn Sie die Aufgaben in der Planansicht abgeschlossen haben, können Sie den Plan drucken oder in Ihr Entwurfssoftwarepaket exportieren.

In der Planansicht verfügbare Aufgaben

Die folgenden Aufgaben stehen nur in der Planansicht zur Verfügung:

  Layer

  Stile (Punkt, Linie, Text)

  Punkte einfügen

  Liniennetz einfügen

  Text einfügen

  Anmerkungen einfügen

  Liniennetz für aktuelle Beobachtungen einfügen

  Nach Layer auswählen

  Nach Stil auswählen

  Nach Typ auswählen

  Nach Punktmerkmal auswählen

  Kartierkodierung

  DTMLink

  RoadLink

Ansichten ändern

Sie können Ansichten jederzeit ändern.

Führen Sie einen der folgenden Schritte aus, um zur Vermessungsansicht zu wechseln:

  Wählen Sie das Symbol Vermessungsansicht.

  Wählen Sie Ansicht / Vermessung.

  Drücken Sie Alt+1.


Befehl Vergrößern

Verwenden Sie diesen Befehl, um einen Abschnitt des Graphikfensters zu vergrößern.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Zoom / Vergrößern.

  Wählen Sie das Symbol Vergrößern [image].

Wenn Sie den Zoom-Navigator dargestellt haben, wird der im Graphikfenster angezeigte Bereich als ein schwarzes Feld im Zoom-Navigator-Fenster dargestellt.

So verwenden Sie das Symbol Vergrößern:

1.	Bewegen Sie den Zeiger über das Graphikfenster.

Der Lupenzeiger mit einem eingeschlossenen Pluszeichen erscheint. Ein Fadenkreuz über dem Lupenzeiger markiert den Hot Spot.

2.	Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf eine Position im Graphikfenster, um um denFaktor 2 zu vergrößern, mit dem Hot Spot als Mittelpunkt.

  Klicken und ziehen Sie den Zeiger über das Graphikfenster, um ein Rechteck zu erzeugen, das den zu vergrößernden Bereich umschließt. Je kleiner der Bereich ist, um so größer ist die Maßstabsänderung. Wenn Sie die Maustaste loslassen, wird der Inhalt des vom Rechteck umschlossenen Bereichs das gesamte Graphikfenster einnehmen. Um den aktuellen Vorgang des Symbols Vergrößern abzubrechen, drücken Sie Esc bei gleichzeitig gedrückter Maustaste.

Wenn Sie eine Maus mit einem Rad haben, verwenden Sie das Rad zum Vergrößern und Verkleinern. Um mit dem Rad zu verschieben, halten Sie das Rad gedrückt, und ziehen Sie die Maus. Der Inhalt des Graphikfensters wird entsprechend verschoben, wenn Sie die Maus verschieben.


Befehl Verkleinern

Verwenden Sie dieses Symbol, um den im Graphikfenster angezeigten Bereich zu erweitern.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Zoom / Verkleinern.

 Wählen Sie das Symbol Verkleinern [image].

Wenn der Zoom-Navigator dargestellt ist, wird der im Graphikfenster angezeigte Bereich als ein schwarzes Feld im Zoom-Navigator-Fenster dargestellt. Wenn Sie über die Ausdehnung des Projekts hinaus verkleinern, wird kein schwarzes Feld im Zoom-Navigator dargestellt.

So verwenden Sie das Symbol Verkleinern:

1.	Bewegen Sie den Zeiger über das Graphikfenster.

Der Lupenzeiger mit einem eingeschlossenen Minuszeichen erscheint. Ein Fadenkreuz über dem Zeiger markiert den Hot Spot.

2.	Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf eine Position im Graphikfenster. Der Maßstab des Graphikfensters ändert sich und wird auf die Position des Hot Spots zentriert.

 Klicken und ziehen Sie den Zeiger über das Graphikfenster, um ein Rechteck zu erzeugen, das den gewünschten Bereich umschließt, und lassen Sie dann die Maustaste los. Der Maßstab des Graphikfensters ändert sich, und die zuvor im Graphikfenster wiedergegebene Information erscheint im ausgewählten rechteckigen Bereich. Je kleiner das Rechteck, um so größer ist die Maßstabsänderung. Um den aktuellen Vorgang des Symbols Verkleinern abzubrechen, drücken Sie Esc bei gleichzeitig gedrückter Maustaste.

Wenn Sie eine Maus mit einem Rad haben, verwenden Sie das Rad zum Vergrößern und Verkleinern. Um mit dem Rad zu verschieben, halten Sie das Rad gedrückt, und ziehen Sie die Maus. Der Inhalt des Graphikfensters wird entsprechend verschoben, wenn Sie die Maus verschieben.


Befehl Zoom-Ausdehnung

Verwenden Sie diesen Befehl, um alle sichtbaren Punkte im aktuellen Projekt anzusehen. Wenn Sie den Befehl Zoom-Ausdehnung wählen, paßt sich das Graphikfenster automatisch an, so daß alle Daten sichtbar sind.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Zoom / Ausdehnung.

  Drücken Sie Strg+E.

 Wählen Sie das Symbol Zoom-Ausdehnung [image].

  Positionieren Sie den Zeiger im Graphikfenster. Klicken Sie auf die rechte Maustaste, und wählen Sie Zoom-Ausdehnung aus dem Verknüpfungsmenü.


Befehl Vorherige Ansicht

Verwenden Sie diesen Befehl, um zurück durch alle Ihre vorherigen Zoom-Ansichten seit dem Einstieg in das Projekt zu gehen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Zoom / Vorherige Ansicht.

 Wählen Sie das Symbol Vorherige Ansicht [image].

Wenn der Zoom-Navigator dargestellt ist, wird der im Graphikfenster angezeigte Bereich als ein schwarzes Feld im Zoom-Navigator-Fenster dargestellt. Wenn Sie über die Ausdehnung des Projekts hinaus verkleinern, wird kein schwarzes Feld im Zoom-Navigator dargestellt.

Wenn Sie mehr als ein Graphikfenster geöffnet haben, wird ein separater Zoom-Stack für jedes Fenster gespeichert.


Befehl Verschieben

Verwenden Sie diesen Befehl, um den Mittelpunkt des Zoombereichs zu verschieben, so daß ein anderer Bereich der Bildschirmansicht dargestellt wird.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Verschieben.

 Wählen Sie das Symbol Verschieben [image].

Der Handzeiger erscheint.

Wenn der Zoom-Navigator dargestellt ist, wird der im Graphikfenster angezeigte Bereich als ein schwarzes Feld im Zoom-Navigator-Fenster dargestellt. Wenn Sie über die Ausdehnung des Projekts hinaus verschieben, wird kein schwarzes Feld im Zoom-Navigator dargestellt.

Ein Verschieben wird nicht als ein Zoom gespeichert. Sie können daher eine Vorherige Ansicht nicht durchführen, um zur ursprünglichen Ansicht vor dem Verschieben zurückzukehren.

So verwenden Sie das Symbol Verschieben:

1.	Verschieben Sie den Zeiger über dem Graphikfenster.

Ein Fadenkreuz über dem Zeiger markiert den Hot Spot.

2.	Klicken und ziehen Sie den Zeiger zu der Stelle, zu der Sie verschieben möchten. Der Inhalt des Graphikfensters wird in Echtzeit verschoben, wenn Sie die Maus verschieben.

Wenn Sie eine Maus mit einem Rad haben, verwenden Sie das Rad zum Vergrößern und Verkleinern. Um mit dem Rad zu verschieben, halten Sie das Rad gedrückt, und ziehen Sie die Maus. Der Inhalt des Graphikfensters wird entsprechend verschoben, wenn Sie die Maus verschieben.


Befehl Verschieben nach
Befehl Verschieben zu

Verwenden Sie diesen Befehl, um zu einer bestimmten Stelle im Graphikfenster zu verschieben und zu skalieren.

Das Dialogfeld Verschieben zu erscheint.


Dialogfeld Verschieben nach
Dialogfeld Verschieben zu

Verwenden Sie dieses Dialogfeld, um zu einer bestimmten Stelle im Graphikfenster zu verschieben und zu skalieren.

Wählen Sie Ansicht / Verschieben zu, um darauf zuzugreifen.

Ansichtsmittelpunkt

Mit Hilfe dieser Felder können Sie Vorgänge mit der graphischen Auswahl durchführen, wie z. B. die Angabe eines Namens oder einer Position für den Ansichtsmittelpunkt.

Punktname	Verwenden Sie dieses Feld, um den Namen des Punkts in der Datenbank anzugeben. Wenn Sie für dieses Feld die graphische Auswahl benutzen, werden die Felder Punktname, Hochwert und Rechtswert ausgefüllt.
Hochwert/Rechtswert	Verwenden Sie diese Felder, um den Ansichtsmittelpunkt zu bestimmen. Wenn Sie die graphische Auswahl benutzen, werden die Felder Hochwert und Rechtswert ausgefüllt.
Ansichtsradius

Das Feld Ansichtsradius legt die Ausdehnung der Ansicht fest. Wenn Sie keine Einheit angeben, wird die Streckeneinheit verwendet, die im Register Einheiten und Format des Dialogfelds Projekteigenschaften festgelegt ist.


    Befehl Filter

Verwenden Sie diesen Befehl, um das Dialogfeld Ansicht Filter zu öffnen.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Filter.

  Wählen Sie das Symbol Ansicht Filter [image].

  Klicken Sie auf das Symbol Ansicht Filter [image] in der Statusleiste.


    Dialogfeld Ansicht Filter

Verwenden Sie dieses Dialogfeld, um alle Beobachtungen herauszufiltern, die Sie während des Arbeitens in der Vermessungsansicht nicht sehen möchten.

HINWEIS: Daten, die durch den Ansichtsfilter verborgen werden, können nicht mit Hilfe eines der Befehle im Menü Wählen ausgewählt werden.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Filter

 Wählen Sie das Symbol Ansicht Filter

  Drücken Sie Strg+F

Beobachtungen

Verwenden Sie diese Gruppe, um die Beobachtungsgruppe auszuwählen, die Sie ansehen möchten. Dies ist hilfreich, wenn Sie ein Projekt mit verschiedenen Beobachtungstypen, wie z. B. RTK und konventionell, haben und nur die RTK-Beobachtungen ansehen möchten.

Alle Beobachtungen anzeigen

Wählen Sie diese Option, um alle Beobachtungen im Projekt anzusehen. Die Option wird eingeblendet, wenn das Netzausgleichungsmodul installiert ist.

Nur Beobachtungen anzeigen, die für die Ausgleichung markiert wurden

Wählen Sie diese Option, um nur die Beobachtungen anzusehen, für die das Kontrollkästchen Bei der Netzausgleichung verwenden gewählt wurde. (Dieses Kontrollkästchen steht auf der Seite Zusammenfassung im Eigenschaftsfenster zur Verfügung.)

Diese Option erscheint, wenn das Netzausgleichungsmodul installiert ist. Wenn Sie diese Option wählen, sind einige Felder für die Beobachtungsgruppen nicht verfügbar.

Nur Beobachtungen anzeigen, die ausgeglichen werden können

Wählen Sie diese Option, um nur die Beobachtungen anzusehen, die in einer Netzausgleichung verwendet werden können, ohne daß das Kontrollkästchen Bei der Netzausgleichung verwenden notwendigerweise aktiviert sein muß. (Dieses Kontrollkästchen ist auf der Seite Zusammenfassung im Eigenschaftsfenster verfügbar).

So können z. B. deaktivierte Beobachtungen und Als Prüfpunkt aktivierte Beobachtungen ausgewählt werden, wenn diese in einer Netzausgleichung verwendet werden können.

Potentielle Basislinien und konventionelle Beobachtungen (die nicht bei einer Netzausgleichung verwendet werden können) werden herausgefiltert.

HINWEIS: Diese Option erscheint, wenn das Netzausgleichungsmodul installiert ist. Wenn Sie diese Option wählen, stehen einige Felder für die Beobachtungsgruppen nicht zur Verfügung.

Anzuzeigende Beobachtungstypen

Die Gruppe Anzuzeigende Beobachtungstypen enthält die folgenden Kontrollkästchen:

  RTK

  NV-Kinematisch

  Laser

  Höhenunterschiede

  Statisch

  Terrestrische

  Reduziert

  Azimut

  Unverarbeitete Basislinien

Verwenden Sie diese Kontrollkästchen, um den Beobachtungstyp auszuwählen, den Sie ansehen möchten. Um z. B. nur RTK-Vektoren anzuzeigen, wählen Sie das Kontrollkästchen RTK und löschen alle anderen in der Gruppe.

  Polarpunkt-Beobachtungen

  Kontinuierlich

  Deaktivierte Beobachtungen

  Prüfbeobachtungen

Verwenden Sie diese Kontrollkästchen, um die Beobachtungen aus den ausgewählten Beobachtungstypen zu wählen, die Sie anzeigen möchten. Sie müssen angeben, welchen Beobachtungstyp in der oberen Gruppe die Beobachtungen in der unteren Gruppe filtern sollen.

Um z. B. nur RTK-Prüfbeobachtungen anzuzeigen, wählen Sie die Kontrollkästchen RTK sowie Beobachtungen prüfen und löschen Sie alle anderen in der Gruppe.

HINWEIS: Wenn eine Beobachtung mehr als eine Beobachtungseigenschaft besitzt, müssen Sie alle Kontrollkästchen wählen, die den Beobachtungstyp betreffen, um sie ansehen zu können.

Unverbundene Punkte anzeigen

Wählen Sie dieses Kontrollkästchen, um Punkte anzuzeigen, von denen keine Beobachtungen ausgehen oder auf die keine zulaufen, wie z. B. eingegebene Punkte.

Ereignisse anzeigen

Wählen Sie dieses Kontrollkästchen, um Ereignisse anzuzeigen.

Nur Daten in Auswahlmenge anzeigen

Wählen Sie dieses Kontrollkästchen, um Daten anzuzeigen, die Sie zuvor als Auswahlmenge gespeichert haben. Wählen Sie die Auswahlmenge aus der Liste.

Timeline verwenden, um abhängige GPS-Basislinien anzuzeigen

Wenn dieses Kontrollkästchen gewählt ist, werden nur die Beobachtungen in der Timeline-Ansicht im Graphikfenster angezeigt.

Sie können dieses Symbol verwenden, um unabhängige Basislinien für die Netzausgleichung auszuwählen.

Verwenden Sie die Schaltfläche Ansicht abhängige Basislinien in der Symbolleiste, um diese Option zu aktivieren/ zu deaktivieren.

HINWEIS: Diese Option wird nur auf nachverarbeitete GPS-Daten angewendet. Alle anderen Daten werden im Graphikfenster mit den entsprechenden Ansichtsfiltern angezeigt.

HINWEIS: Diese Option steht nur zur Verfügung, wenn das Basislinienverarbeitungsmodul installiert ist.

Zeit

Wählen Sie dieses Kontrollkästchen, um nur die GPS-Beobachtungen anzuzeigen, die sich innerhalb eines angegebenen Datums und Zeitraums befinden. Die Felder Von und Zu sind aktiviert.

Von / Zu

Verwenden Sie die graphische Auswahl (wählen Sie die Zeit aus dem Zeit-Lineal in Timeline) oder die Tastatur, um die Zeitspanne für die darzustellenden GPS-Beobachtungen einzugeben.

HINWEIS: Mit Hilfe der beiden Zeit-Optionen können Sie zwei verschiedene Zeitabschnitte angeben, die Sie filtern möchten.

Sie können auch Tage eingeben.


Punktbeschriftungen - Überblick
Punktbeschriftungen − Überblick

Weitere Informationen

Wie kann ich ...	Siehe auch
Überblick

Verwenden Sie Beschriftungen, um Informationen über Elemente im Graphikfenster darzustellen, ohne diese Informationen in der Datenbank zu speichern. Beschriftungen stehen sowohl in der Vermessungsansicht als auch in der Planansicht zur Verfügung.

Einstellungen für Beschriftungen werden wiederhergestellt, wenn Sie ein Projekt zwischen Arbeitssitzungen neu öffnen. Um Informationen über Elemente in der Projektdatenbank zu speichern, verwenden Sie Anmerkungen. Sie können Anmerkungen nur in der Planansicht hinzufügen.

Sie können Punkte mit einer Kombination von Feldern und benutzerdefiniertem Text bezeichnen. Um benutzerdefinierte Beschriftungsoptionen hinzuzufügen, verwenden Sie einen Text-Editor zur Bearbeitung der Datei Options.ini. Beschriftungen erscheinen immer rechts vom bezeichneten Punkt.

Beschriftungen werden in der Schriftart und -größe dargestellt, die der QuickInfo in den Microsoft Windows Anzeigeeinstellungen zugewiesen ist.


Befehl Projektleiste

Verwenden Sie diesen Befehl, um die Projektleiste ein- und auszublenden.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Projektleiste.

  Wählen Sie das Symbol Projektleiste [image].


Befehl Aktualisieren

Verwenden Sie diesen Befehl, um den Bildschirm zu aktualisieren.

Führen Sie einen der folgenden Schritte aus, um darauf zuzugreifen:

  Wählen Sie Ansicht / Aktualisieren.

  Drücken Sie F5.

Wählen Sie diesen Befehl, um die Planansicht erneut zu zeichnen, falls das Graphikfenster überschrieben wurde und schwer lesbar ist.


Dialogfeld Ansichtsoptionen

Verwenden Sie dieses Dialogfeld, um die Anzeige der Daten benutzerdefiniert zu gestalten. Wählen Sie Ansicht / Optionen, um darauf zuzugreifen.

Das Dialogfeld Ansichtsoptionen verfügt über die folgenden Register:

  Gitterlinien

  Vermessungslegende

  Vermessungsdaten

  Fehlerellipsen-Steuerung

  Hintergrundkarte


Dialogfeld Punktbeschriftungen

Verwenden Sie dieses Dialogfeld, um Punktbeschriftungen im Projekt anzuzeigen.

Wählen Sie Ansicht / Punktbeschriftungen, um im Hauptmenü darauf zuzugreifen.

Punkte beschriften mit

Wählen Sie die Felder, mit denen Punkte beschriftet werden sollen. Die nachstehenden Optionen sind in Trimble Geomatics Office enthalten. Alle benutzerdefinierten Beschriftungsoptionen, die Sie unter Verwendung der Datei Options.ini hinzufügen, erscheinen in dieser Liste:

  Name

  Kartiercode

  Höhe

  Maßstabsfaktor Gitter

  Maßstabsfaktor Höhe

  Kombinierter Maßstabsfaktor

  Konvergenzwinkel

  Horizontale Qualität

  Höhenqualität

  Ellips. Höhenqualität

Anwenden auf

Es stehen zwei Optionen für die Punktbeschriftung zur Verfügung:

  Auswahl – wählen Sie diese Option, um die ausgewählten Punkte zu beschriften.

  Ganze Datenbank – wählen Sie diese Option, um alle Punkte zu beschriften. Wenn in der Vermessungsansicht keine Auswahl getroffen wurde, ist diese Option gemäß Voreinstellung gewählt.

Wenn Sie eine Auswahl beschriften, erzeugt Trimble Geomatics Office automatisch eine benannte Auswahlmenge mit den beschrifteten Punkten.

HINWEIS: Sie können jeweils nur eine Auswahl beschriften. Wenn Sie eine Reihe von Punkten beschriftet haben, und danach eine neue Auswahl beschriften, werden die Beschriftungen in der ersten Auswahl entwählt.

Löschen

Klicken Sie auf Löschen, um alle aktuellen Beschriftungen zu löschen.

HINWEIS: Die Beschriftungseinstellungen werden wiederhergestellt, wenn Sie ein Projekt mit Punktbeschriftungen erneut öffnen.

TIP: Verrwenden Sie die Standard-Windows Anzeigeeinheiten für QuickInfos, um die Schriftart und -größe des Beschriftungstexts zu ändern.


Dialogfeld Ansichtsoptionen - Register Gitterlinien

Verwenden Sie dieses Register, um Gitterlinien im Graphikfenster anzuzeigen.

So greifen Sie darauf zu:

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie das Register Gitterlinien.

Gitterlinien anzeigen

Wählen Sie dieses Kontrollkästchen, um Gitterlinien im Graphikfenster anzuzeigen. Wenn die Gitterlinien angezeigt werden, erscheint das Gitterintervall in der Statusleiste.

HINWEIS: Sie können ebenfalls Gitterlinien anzeigen, indem Sie die Schaltfläche Gitterlinien [image] in der Symbolleiste wählen.

Folgende Elemente werden verfügbar:

Feste Anzahl an Gitterlinien

Verwenden Sie diese Option, um die Anzahl der auf dem Bildschirm angezeigten Gitterlinien festzulegen. Es wird immer dieselbe Anzahl an Gitterlinien angezeigt, auch dann, wenn Sie die Ansicht vergrößern oder verkleinern.

HINWEIS: Die feste Anzahl an Gitterlinien wird auf der kurzen Seite des Bildschirms angezeigt.

Gitterintervall

Verwenden Sie diese Option, um das Gitterintervall festzulegen. Die Streckeneinheiten sind die, die für das Projekt festgelegt wurden.

HINWEIS: Wenn die Anzahl der Gitterlinien zu groß ist, um übersichtlich auf dem Bildschirm dargestellt zu werden, werden keine Gitterlinien angezeigt.

Gitterlinientyp

Verwenden Sie diese Option, um den Stil für die Gitterlinien zu wählen, z. B. Durchgehend oder Gepunktet.

Gitterlinienfarbe

Verwenden Sie diese Option, um die Farbe für die Gitterlinien zu wählen. Sie müssen die Farbe der Gitterlinien möglicherweise ändern, damit sie sich deutlich von der Hintergrundfarbe des Graphikfensters abheben.

Gitterlinien beschriften

Wählen Sie dieses Kontrollkästchen, um Gitterlinien mit den Hoch- und Rechtswerten zu beschriften.

HINWEIS: Die Gitterlinien werden gedruckt, wenn Sie den Befehl Befehl Plotten/Drucken verwenden.


Dialogfeld Ansichtsoptionen - Register Vermessungslegende

Verwenden Sie dieses Register, um die Anzeigefarben für das Projekt im Trimble Geomatics Office-Graphikfenster. Sie können in diesem Register folgendes festlegen:

  die Anzeige unterschiedlicher Beobachtungstypen und Punkte in der Vermessungsansicht

  die Hintergrundfarbe des Graphikfensters

  die voreingestellte Farbe für Text

So greifen Sie darauf zu:

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie das Register Vermessungslegende.

Stil Legende

Wählen Sie in diesem Feld die Option Schwarz oder Weiß. In der nachfolgenden Tabelle werden die Farbeinstellung für jede Option beschrieben:


Dialogfeld Ansichtsoptionen- Register Vermessungsdaten

Verwenden Sie dieses Register, um die Anzeige der Vermessungsdaten im Graphikfenster zu ändern.

So greifen Sie darauf zu:

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie das Register Vermessungsdaten.

HINWEIS: Dieses Register wird nur in der Vermessungsansicht angezeigt.

Kurzpfeile für Polarpunkte verwenden

Wählen Sie dieses Kontrollkästchen, um Polarpunkt-Vektoren als Kurzpfeile anzuzeigen.

Anzahl Beobachtungen anzeigen (wenn >1)

Wählen Sie dieses Kontrollkästchen, um die Anzahl der Beobachtungen auf mehrfach beobachteten Linien anzuzeigen.

Wenn eine Beobachtung gefiltert wird, wird die Anzahl der Beobachtungen als Verhältnis des Anzeigewerts zur Gesamtzahl der Beobachtungen dargestellt, z. B. 1/3.


Dialogfeld Ansichtsoptionen - Register Fehlerellipsen-Steuerungen

Verwenden Sie dieses Register, um festzulegen, ob Fehlerellipsen und Pfeile für ellipsoidische und orthometrische Höhenfehler nach einer Ausgleichung im Graphikfenster angezeigt werden sollen. Sie können ebenfalls den Maßstab der Fehlerellipsen und die Markierungsgröße festlegen.

So greifen Sie darauf zu:

1.	Wählen Sie  Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie das Register Fehlerellipsen-Steuerungen.

HINWEIS: Dieses Register ist nur in der Vermessungsansicht verfügbar.

Punktfehlerellipsen & Pfeile anzeigen

Wählen Sie dieses Kontrollkästchen, um Punktfehlerellipsen und Pfeile anzuzeigen.

Höhenfehler anzeigen

Wählen Sie dieses Kontrollkästchen, um orthometrische Höhenfehler anzuzeigen.

Ellips. Höhenfehler anzeigen

Wählen Sie dieses Kontrollkästchen, um ellipsoidische Höhenfehler anzuzeigen.

Maßstab Fehlerellipse

Der Schieber für den Maßstab der Fehlerellipse (nachstehend abgebildet) steuert die Größe der Fehlerellipsen, die nach einer Ausgleichung im Graphikfenster angezeigt werden.

Wenn Sie den Schieber nach rechts bewegen, werden die Ellipsen kleiner. Eine Verschiebung nach rechts hat den umgekehrten Effekt.

Markierungsgröße

Verwenden Sie dieses Feld, um den Abstand zwischen den Markierungen auf der Fehlerellipsenmaßstabsleiste im Graphikfenster festzulegen.

Die Maßstabsleiste wird größer, wenn der Maßstab vergrößert wird. Der Markierungsabstand wird entsprechend angepaßt, abhängig von dem Wert, der in das Feld Markierungsgröße eingegeben wurde.


Dialogfeld Ansichtsoptionen - Register Hintergrundkarte

In Trimble Geomatics Office können Hintergrund-Dateien im Graphikfenster angezeigt werden. Sie können Hintergrundbild-Dateien exportieren die angezeigt werden sollen, z. B. Drawing Exchange Format (.dxf), Windows Bitmap (.bmp), oder Tagged Image Dateiformat-Dateien (.tif). Windows Bitmap (.bmp), oder Tagged Image Dateiformat-Dateien (.tif) müssen sich auf ein Geoid beziehen, um korrekt angezeigt werden zu können.

Das ESRI Weltdatei-Format wird zur Georeferenzierung von Hintergrund-Dateien verwendet. Eine Weltdatei ist eine ASCII-Text-Datei mit einer tfw- oder .wld-Erweiterung. In Trimble Geomatics Office gelten folgende Bedingungen für Weltdateien. Sie müssen:

  im selben Ordner gespeichert werden, wie die verknüpften .dxf-, .bmp- oder.tif-Datei

  dasselbe Koordinatensystem haben, wie das Trimble Geomatics Office Projekt.

  dieselben Einheiten haben, wie das Trimble Geomatics Office Projekt.

HINWEIS: Trimble Geomatics Office unterstützt dekomprimierte TIFF-Dateien und folgende Kompressions-Schemata: CCITT, PackBits, Thunder, Next, LogLuv. Die folgenden komprimierten Dateien werden jedoch nicht unterstützt: OJPEG, JPEG, ZIP, LZW, PixarLog.

HINWEIS: Trimble Geomatics Office unterstützt ebenfalls keine RLE-komprimierten .bmp-Dateien.

Verwenden Sie das Register Hintergrundkarte, um eine Hintergrund-Datei auszuwählen, die angezeigt werden soll.

So greifen Sie darauf zu:

1.	Wählen Sie Ansicht / Optionen. Das Dialogfeld Ansichtsoptionen erscheint.

2.	Wählen Sie das Register Hintergrundkarte.

Dateinamen

In dieser Gruppe wird eine Liste der Dateien angezeigt, die als Hintergrundkarten ausgewählt wurden.

Hinzufügen

Verwenden Sie die Schaltfläche Hinzufügen, um die Hintergrund-Dateien auszuwählen. Sie können eine .dxf-, .bmp-, oder .tif-Datei wählen.

HINWEIS: Vergewissern Sie sich, daß die Weltdatei unter demselben Pfad gespeichert ist. Sie müssen diese Datei nicht in der Liste wählen.

Entfernen

Verwenden Sie die Schaltfläche Entfernen, um eine Hintergrund-Datei aus der Liste zu entfernen.

Weltdateiformat

Ein Beispiel einer Datei im Weltformat ist nachstehend dargestellt:

20.17541308822119

0.00000000000000

0.00000000000000

−20.17541308822119

424178.11472601280548

4313415.90726399607956

Diese 6 Werte werden zur Berechnung einer Bild-zu-Weltformattransformation mit einer Sechs-Parameter affinen Transformation wie folgt verwendet:

x1 = Ax + By + C

y1 = Dx + Ey + F

wobei

x1 	die berechnete x-Koordinate des Pixels auf der Karte ist

y1 	die berechnete y-Koordinate des Pixels auf der Karte ist

x 	die Spaltennummer eines Pixels im Bild ist

y 	die Reihennummer eines Pixels im Bild ist

A 	x-Achse; die Dimension eines Pixels in Karteneinheiten in Richtung x

B, D	Rotationsausdrücke

C, F	Übersetzungsausdrücke; x,y Kartenkoordinaten des Pixelmittelpunkts in der oberen linken Ecke

E 	negativer Wert auf der y-Achse; die Dimension eines Pixels in Karteneinheiten in Richtung y

Die Transformationsparameter werden in der Weltdatei in folgender Reihenfolge gespeichert:

20.17541308822119 – A

0.00000000000000 – D

0.00000000000000 − B

-20.17541308822119 − E

424178.11472601280548 − C

4313415.90726399607956 − F

HINWEIS: In Trimble Geomatics Office unterstützt die Rotation von Bildern nicht. Wenn Ihre Weltdatei Rotationsausdrücke ungleich Null hat (D und B Parameter), werden diese nicht verwendet.

HINWEIS: Die Vorzeichen der x- (A) oder der y-Achse (E) ändern sich in Abhängigkeit von der Orientierung des Koordinatensystems. Dies geschieht, da der Ursprung eines Bildes und eines geographischen Koordinatensystems unterschiedlich sind. Der Bildursprung ist immer die obere linke Ecke, wohingegen der Ursprung eines geographischen Koordinatensystems von der Koordinatenrichtung abhängig ist.

Bei einem NO-Koordinatensystem befindet sich der Ursprung in der linken unteren Ecke. Die Zeilenwerte im Bild erhöhen sich, ausgehend von der oberen linken Ecke, nach unten; die Werte für y-Koordinaten auf der Karte erhöhen sich von der linken unteren Ecke nach oben, daher ist die y-Achse (E) in einem NO-Koordinatensystem negativ. In der folgenden Tabelle sind die Vorzeichen der x- und y-Achsen dargestellt, die für NO-, SW- und NW-Koordinatensysteme verwendet werden sollten.

	NO	SW	NW
x(A)	+ve	-ve	-ve
y(E)	-ve	+ve	-ve


Garantiebestimmungen

Garantieeinschränkungen für Software und Firmware

Trimble Navigation Limited garantiert, daß dieses Trimble Software-Produkt (die "Software") für die Dauer von neunzig (90) Tagen, beginnend am Tag des Versands, die für die Software veröffentlichen anwendbaren Spezifikationen von Trimble im Wesentlichen erfüllt.

Rechtsbehelf

Trimbles einzige Haftung und Ihr einziger Rechtsanspruch gegen jeglichen Bruch der vorstehenden Garantie ist wie folgt: Trimble behebt nach eigenem Ermessen alle Produkt- oder Softwarefehler eines fehlerhaften Produkts, das die vorstehende Garantie nicht erfüllt (“nicht vertragsgemäßes Produkt”) oder ersetzt den Kaufpreis eines nicht vertragsgemäßen Produkts, wenn dieses an Trimble zurück geschickt wird.

Garantieausschluß

Die obige Garantie gilt nicht für Fehler hervorgerufen durch: (i) unsachgemäße Installation, Konfiguration, Anschluß, Lagerung, Wartung und Betrieb der nicht dem Trimble Betriebs-/Benutzerhandbuch und den Spezifikationen des Produkts entspricht, und (ii) Mißbrauch oder artfremder Nutzung der Produkte. Die vorstehende Garantie gilt nicht für Garantieansprüche oder -verletzungen, und Trimble kann nicht haftbar gemacht werden für: (i) Schäden oder Leistungsprobleme durch die Verwendung oder Kombination des Produkts oder der Software mit Informationen, Systemen oder Geräten, die nicht von Trimble hergestellt, vorgeschrieben oder geliefert werden; (ii) den Betrieb des Produkts oder der Software, der nicht den Trimble-Standardspezifikationen für dieses Produkt entspricht; (iii) unerlaubte Modifikation oder Verwendung des Produkts oder der Software; (iv) Schäden durch Blitzschlag oder elektrische Entladung, Süß- oder Salzwasser, sowie Spritzwasser (v) normale Abnutzung von Verbrauchsmaterialien (z. B. Batterien).

AUßER IN DEN VORSTEHEND DARGELEGTEN “GARANTIEEINSCHRÄNKUNGEN”, WIRD TRIMBLE HARDWARE, SOFTWARE, FIRMWARE UND DIE DOKUMENTATION “WIE GESEHEN” ANGEBOTEN, OHNE AUSDRÜCKLICHE ODER EINGESCHRÄNKTE GARANTIE JEGLICHER ART SOWOHL VON SEITEN DER TRIMBLE NAVIGATION LIMITED ALS AUCH VON JEGLICHEN PERSONEN, DIE AN DER ERZEUGUNG, HERSTELLUNG ODER DEM VERTRIEB BETEILIGT WAREN, EINSCHLIEßLICH ABER NICHT BEGRENZT AUF, IE ANGENOMMENEN GARANTIEN FÜR VERWERTBARKEIT UND VERWENDBARKEIT FÜR EINE BESTIMMTE ANWENDUNG. DAS GESAMTE RISIKO FÜR QUALITÄT UND LEISTUNGSFÄHIGKEIT DER TRIMBLE HARDWARE, SOFTWARE, FIRMWARE UND DOKUMENTATION WIRD VOM ENDKUNDEN GETRAGEN. IN EINIGEN STAATEN IST DER AUSSCHLUß VON ANGENOMMENEN GARANTIEN NICHT ERLAUBT, DAHER TRIFFT OBIGER AUSSCHLUß MÖGLICHERWEISE FÜR SIE NICHT ZU.

Haftungsausschluß

DA DIE SOFTWARE AUSGESPROCHEN UMFANGREICH UND DAHER MÖGLICHERWEISE NICHT FEHLERFREI IST, WIRD EMPFOHLEN, DURCHGEFÜHRTE ARBEITEN ZU ÜBERPRÜFEN. UNTER KEINEN UMSTÄNDEN IST TRIMBLE NAVIGATION LIMITED ODER PERSONEN, DIE AN DER ERZEUGUNG, HERSTELLUNG ODER DEM VERTRIEB DER TRIMBLE SOFTWARE BETEILIGT WAREN, IHNEN GEGENÜBER FÜR JEGLICHE ART VON SCHADENSERSATZANSPRÜCHEN HAFTBAR, EINSCHLIEßLICH GEWINNVERLUST ODER ANDERER SPEZIELLER, ZUFÄLLIGER, FOLGENDER ODER ÜBER DEN VERURSACHTEN SCHADEN HINAUSGEHENDER SCHÄDEN, EINSCHLIEßLICH, ABER NICHT BEGRENZT, AUF JEGLICHE ART VON SCHÄDEN, DIE GEGEN SIE ENTSTEHEN ODER FÜR DIE SIE AN DRITTE BEZAHLT HABEN, HERVORGERUFEN AUS DER VERWENDUNG ENTSTEHENDEN HAFTUNG, QUALITÄT ODER LEISTUNGSFÄHIGKEIT SOLCHER TRIMBLE-SOFTWARE UND DOKUMENTATION, AUCH DANN, WENN TRIMBLE NAVIGATION LIMITED ODER EINER SOLCHEN PERSON ODER STELLE DIE MÖGLICHKEIT SOLCHER SCHÄDEN BEKANNT GEMACHT WURDE, ODER FÜR JEDEN ANSPRUCH DRITTER. EINIGE STAATEN ERLAUBEN DEN HAFTUNGSAUSSCHLUß FÜR ZUFÄLLIGE ODER FOLGESCHÄDEN NICHT, DIESE OBIGEN AUSSCHLÜSSE TREFFEN DESHALB MÖGLICHERWEISE FÜR SIE NICHT ZU.

SOLLTE TRIMBLE DEN FEHLERHAFTEN DATENTRÄGER ODER DIE DOKUMENTATION NICHT ERSETZEN ODER DEN PROGRAMMFEHLER NICHT BEHEBEN KÖNNEN, ERSETZT TRIMBLE DEN FÜR DIE SOFTWARE ODER DAS PRODUKT BEZAHLTEN PREIS. DIES IST IHR EINZIGER RECHTSANSPRUCH FÜR JEGLICHEN BRUCH DER GARANTIE.


Willkommen zur Trimble Geomatics Office™-Hilfe.

Dieses Hilfe-Programm ist darauf ausgelegt, Ihnen die Information zu bieten, die Sie benötigen, um die volle Leistungsfähigkeit und Kapazität der Trimble Geomatics Office Software effektiv nutzen zu können. Das Programm beschreibt, wie  Trimble Geomatics Office einzurichten und zu verwenden ist.

  Verwendung der Hilfe

  Trimble Geomatics Office - Überblick

  Info über Trimble

  Feedback


Befehl Neues Fenster

Verwenden Sie diesen Befehl, um ein anderes Fenster für das aktuelle Projekt zu öffnen.

Wählen Sie Fenster / Neues Fenster, um darauf zuzugreifen.

Jedes neue Fenster wird zu der Liste der Fenster im Fenstermenü hinzugefügt.

Das neue Fenster hat denselben Inhalt wie das aktive Fenster. Sie können mehrere Fenster öffnen, um unterschiedliche Teile oder Ansichten des Projekts zur gleichen Zeit anzuzeigen. Sie können z. B. verschiedene Fenster öffnen und in jedem dieser Fenster einen anderen Layer des Projekts anzeigen.

Wenn Sie den Inhalt in einem Fenster ändern, spiegeln alle anderen Fenster, die dasselbe Projekt enthalten, diese Änderungen wider, vorausgesetzt, sie zeigen diese Informationen an.

Wenn Sie ein neues Fenster öffnen, wird dieses zum aktiven Fenster und wird über allen übrigen Fenstern angezeigt.


Befehl Überlappend

Verwenden Sie diesen Befehl, um mehrfache, geöffnete Projektfenster überlappend anzuordnen.

Wählen Sie Fenster / Überlappend, um darauf zuzugreifen.

Die Fenster werden so übereinander angeordnet, daß Sie die Titelleiste jedes Fensters sehen können.


Befehl Nebeneinander

Verwenden Sie diesen Befehl, um alle Projektfenster, die gerade geöffnet sind, neu anzuordnen.

Wählen Sie Fenster / Nebeneinander, um darauf zuzugreifen.

Die Fenster werden nebeneinander angeordnet.


Befehl Symbole anordnen

Verwenden Sie diesen Befehl, um alle Symbole minimierter Fenster in einem übersichtlichen Muster auf dem Bildschirm neu anzuordnen.

Wählen Sie Fenster / Symbole anordnen, um darauf zuzugreifen.

Die Symbole werden am unteren Fensterrand angeordnet.


Befehl Teilen

Verwenden Sie diesen Befehl, um zwei Teile eines Projekts zur gleichen Zeit anzusehen.

Wählen Sie Fenster / Teilen, um darauf zuzugreifen.

Die Größe der geteilten Fenster kann geändert werden, indem Sie auf den Fensterteiler klicken und diesen ziehen. Änderungen, die an einem Teil vorgenommen wurden, erscheinen simultan in dem anderen Teil.


Befehl Liste anzeigen

Verwenden Sie diesen Befehl, um ein Fenster in der Anzeigeliste zu öffnen. Die Liste zeigt alle geöffneten Fenster an.

Wählen Sie ein Fenster aus dem Menü, um darauf zuzugreifen.


World Wide Web-Adresse
World Wide Web (WWW)-Adresse

Besuchen Sie die Trimble World Wide Web-Adresse für einen interaktiven Einblick bei Trimble www.trimble.com/


Eigenschaftsfenster - Überblick
Eigenschaftsfenster − Überblick

Im Eigenschaftsfenster können Sie Informationen über alle Elemente (Punkte, Beobachtungen, Linien, Bögen, Kurven, Text, Anmerkungen, Notizen) ansehen.

Verwenden Sie das Eigenschaftsfenster, um die Eigenschaften eines gewählten Elements anzusehen und zu bearbeiten. Sie können nur jeweils die Eigenschaften eines Elements ansehen. Alle an den Elementen im Eigenschaftsfenster vorgenommenen Änderungen werden unverzüglich angewandt.

Sie können die Größe des Eigenschaftsfensters ändern, indem Sie auf den Fensterrahmen klicken und ziehen. Klicken Sie auf die Schaltfläche in der rechten oberen Ecke, um das Fenster zu schließen.

Sie können das Eigenschaftsfenster geöffnet lassen, während Sie andere Teile von Trimble Geomatics Office verwenden. Das Eigenschaftsfenster wird automatisch aktualisiert, um die korrekten Informationen über die aktuelle Auswahlmenge anzuzeigen.

Wenn Sie eine aktuelle Auswahlmenge definiert haben und ein Element wählen, um dieses in der  Auswahlliste des Eigenschaftsfensters anzusehen, wird die aktuelle Auswahl im Graphikfenster aktualisiert und enthält nur das Element,  das Sie gerade ansehen. In der Auswahlliste im Eigenschaftsfenster wird die ursprüngliche Auswahlmenge beibehalten. Alle in der Auswahlliste des Eigenschaftsfensters hervorgehobenen Elemente werden zur aktuellen Auswahlmenge im Graphikfenster.

Die Baumansicht im Eigenschaftsfenster zeigt die Namen und Werte der gewählten Elemente auf dem Bildschirm an. Die Baumansicht zeigt die Beziehung zwischen den Elementen an. Sie können z. B. den “Von”- und “Zu”-Punkt für jede Beobachtung oder jedes Linienelements ansehen, indem Sie auf das Pluszeichen (+) klicken und den Punkt wählen, den Sie ansehen und bearbeiten möchten.

Die Ansicht kann an den Knoten ausgeblendet oder expandiert werden:

  Klicken Sie auf das Pluszeichen (+), um die Baumansicht zu expandieren.

  Klicken Sie auf das Minuszeichen (−), um die Baumansicht auszublenden.

Die Informationen und Register, die auf der rechten Seite des Eigenschaftsfensters verfügbar sind, sind von dem aktuell gewählten Elementtyp abhängig.

Auswahl-Symbole im Eigenschaftsfenster

Mit den Auswahl-Symbolen im Eigenschaftsfenster können Sie die aktuelle Auswahl-Liste konfigurieren.

Auswahl	Symbol	Klicken Sie auf diese Schaltfläche, um ...
Vermessungsdaten gruppieren		Vermessungsdaten nach Datenquelle, Datentyp oder Beobachtungsrichtung zu gruppieren.
Sortieren		die Elemente in der Auswahl-Liste zu sortieren. Wählen Sie die gewünschte Option aus der Liste. Sie können Punkte nach Datenbankreihenfolge, Höhe, Name, Qualität, Startzeit, Länge der Besetzung oder nach Datentyp sortieren.
Filtern		nur Punkte, Beobachtungen, Beobachtungen mit Warnkennzeichnungen oder die aktuelle Auswahlmenge beizubehalten. Sie können die aktuelle Auswahl auch entfernen.  HINWEIS: Sie können Ihre eigenen Abfragen zur Filter-Liste hinzufügen.
Qualitätsindikatoren

Qualitätsindikatoren sind kleine Symbole, die rechts von jedem Feld in der Seitenzusammenfassung angezeigt werden. Diese Symbole geben die Qualität der Vermessungsdaten an. Folgende Qualitäten stehen zur Verfügung: Festpunktgüte, Fest, Vermessungsgüte, Kartographiegüte, Unbekannte Güte oder Ausgeglichen. Die Qualitätsindikatoren werden ebenfalls im Punktableitungsbericht und im Neuberechnungsbericht verwendet.

Geoidindikatoren

Geoidindikatoren geben an, ob die orthometrischen bzw. ellpsoidischen Höhenkomponenten eines Punktes aus dem für das Projekt definierten Geoid abgeleitet wurden. Der Geoidindikator erscheint zusammen mit dem Qualitätsindikator.

Wenn Sie z. B. einen RTK-Punkt messen, hat dieser eine WGS-84 Höhe und eine orthometrische Höhe, die von dem Geoid abgeleitet wurde. Wenn Sie einen terrestrischen Punkt erfassen, hat dieser eine orthometrische Höhe und eine WGS-84 Höhe, die von dem Geoid abgeleitet wurde.

Geoidindikatoren werden ebenfalls im Punktableitungsbericht und im Neuberechnungsbericht verwendet.

Die Qualität des Geoid-Modells wird im Register Neu berechnen des Dialogfelds Projekteigenschaften festgelegt.

Automatisch verkleinern

Verwenden Sie dieses Symbol [image] , um das Eigenschaftsfenster zu minimieren, wenn Sie Einheiten im Graphikfenster auswählen.

Größe sperren

Verwenden Sie dieses Symbol [image], um sicherzustellen, daß das Eigenschaftsfenster, wenn es geöffnet ist, immer dieselbe Größe hat.


Eigenschaftsfenster - Register Vermessung - Überblick
Eigenschaftsfenster − Register Vermessung − Überblick

Verwenden Sie das Register Vermessung, um die vermessungsbezogenen Eigenschaften eines Elements in der Auswahl anzusehen und zu bearbeiten. Sie können die Eigenschaften von Elementen ansehen, die in der Vermessungsansicht erscheinen, z. B.:

  Punkte

  GPS-Beobachtungen

  Konventionelle Beobachtungen

  Nivellement-Beobachtung

  Laser-Entfernungsmesser-Beobachtungen

  Berechnete Beobachtungen (Offsets)

Seiten

Vermessungsinformationen sind in Seiten unterteilt. Es kann nur eine Seite nach der anderen angesehen werden. Sie können auf die Seiten unter Verwendung der verfügbaren Menü-Schaltflächen zugreifen. Die Menü-Schaltflächen bieten Zugriff auf alle Vermessungsinformationen und sind von dem aktuell gewählten Elementtyp abhängig.

Punkte und Beobachtungen löschen

Verwenden Sie die Schaltfläche Löschen [image] im Eigenschaftsfenster, um Punkte und Beobachtungen zu löschen. Wenn ein Punkt oder eine Beobachtung nicht gelöscht werden kann, steht die Schaltfläche Löschen nicht zur Verfügung.

HINWEIS: Eine festgehaltene Koordinate kann nicht gelöscht werden. Sie müssen den Status der Koordinate ändern, bevor Sie sie löschen können.


Eigenschaftsfenster - Register Vermessung - Punkte
Eigenschaftsfenster − Register Vermessung − Punkte

 Überblick

Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um die vermessungsbezogenen Informationen des gewählten Punktes anzusehen und zu bearbeiten. Die Vermessungsinformationen sind in Seiten aufgeteilt.

Sie können auf die folgenden Seiten zugreifen, indem Sie auf die entsprechende Menü-Schaltfläche klicken:

Zusammenfassung
Warnung
Besetzungen und Einstellungen
Fehlerschätzung


Eigenschaftsfenster - Register Vermessung - Seite Zusammenfassung (Punkte)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (Punkte)

Weitere Informationen

 Wie kann ich

Verwenden Sie die Seite Zusammenfassung, um die abgeleitete Position und die Qualitäten für den gewählten Punkt im Eigenschaftsfenster anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Zusammenfassung

Punktname

Zeigt den Namen des Punktes an. Geben Sie einen Wert in dieses Feld ein, um den Namen zu ändern.

Koordinatenfelder

Zeigen die abgeleiteten Punktpositionen und die jeder Komponente zugeordneten Qualitäten an. Die angezeigten Koordinatenfelder sind von der eingestellten Anzeigeoption abhängig.

Gitter / Örtlich / WGS-84

Wählen Sie die Koordinatenanzeigeoption für den Punkt.

HINWEIS: Wenn die Anzeigeoption auf WGS-84 eingestellt ist, sind die angezeigten Koordinatenfelder von der Einstellung im Feld „WGS-84 anzeigen als“ im Register Einheiten und Format des Dialogfeldes Projekteigenschaften abhängig. Wenn WGS-84 anzeigen als z. B. auf B,L,H eingestellt ist, werden die Koordinatenfelder auf der Seite Zusammenfassung mit Breitengrad, Längengrad und ellipsoidischer Höhe beschriftet. Wenn WGS-84 anzeigen als z. B. auf X,Y,Z eingestellt ist, werden die WGS-84-Felder als X,Y,Z angezeigt.

Ableitungsbericht anzeigen

Wählen Sie die Schaltfläche Ableitungsbericht  [image] anzeigen, um den Punktableitungsbericht anzusehen.

Koordinate hinzufügen

Wählen Sie das Symbol Koordinate hinzufügen [image], wenn Sie eine im Büro eingegebene Gittter-, örtliche oder WGS-84 Koordinate eingeben möchten. (Sie sollten dies nur dann tun, wenn die Software die im Büro eingegebenen Koordinaten anstelle der Koordinaten, die aus Beobachtungen abgeleitet wurden, verwenden soll). Die eingegebene Koordinate hat die Quelle Im Büro eingegeben.

Sie können nur eine im Büro eingegebene Gitter-/örtliche und nur eine im Büro eingegebene WGS-84 Koordinate, die mit einem Punkt verbunden sind, hinzufügen. Wenn bereits eine WGS-84 Koordinate und eine Gitter- oder örtliche Koordinate existiert, steht das Symbol Koordinate hinzufügen nicht zur Verfügung.

HINWEIS: Wenn Sie eine Koordinate hinzufügen, wird für die Koordinatenkomponenten-Felder und für die Qualität Null angezeigt. Wählen Sie das Symbol Aktuellen Wert einfügen [image], um die aktuelle Punktposition und -qualität einzugeben.


Eigenschaftsfenster - Register Vermessung - Seite Warnung
Eigenschaftsfenster − Register Vermessung − Seite Warnung

Verwenden Sie die Seite Warnung, um die Meldungen anzusehen und zu unterdrücken, die mit Warnkennzeichnungen assoziiert sind, die auf Punkten oder Beobachtungen in der Vermessungsansicht erscheinen.

So greifen Sie darauf zu:

1.	1.	1.	Führen Sie einen der folgenden Vorgänge aus:

  Doppelklicken Sie auf einen Punkt oder eine Beobachtung mit einer Warnkennzeichnung, den/die Sie ansehen möchten.

  Doppelklicken Sie auf das Warnkennzeichnungssymbol in der Statusleiste, um alle Punkte mit Warnkennzeichnungen zu wählen.

Das Eigenschaftsfenster erscheint.

2.	2.	2.	Wenn sich mehr als ein Element in der Auswahl befindet, wählen Sie das Element, das Sie ansehen möchten.

Um auf die Seite Warnung zuzugreifen, klicken Sie auf die Menü-Schaltfläche Warnung [image].

Sie sollten alle Warnkennzeichnungen vor dem Export von Koordinaten auflösen oder unterdrücken. Wenn ein Abschluß außerhalb der Toleranz aufgelöst wird, indem eine fehlerhafte Beobachtung deaktiviert oder der Punkt umbenannt wird, wenn die Beobachtung zu einem anderen Punkt durchgeführt wurde, erscheint die Fehlerkennzeichnung.

Die folgende Tabelle beschreibt die Meldung, die zusammen mit den Warnkennzeichnungen erscheinen kann:

Diese Meldung unterdrücken

Wählen Sie dieses Kontrollkästchen, um die Warnkennzeichnung zu unterdrücken, die mit dem gewählten Punkt oder der gewählten Beobachtung assoziiert ist, wenn Sie der Meinung sind, daß der Fehler für die Vermessung akzeptabel ist. Die Warnkennzeichnung erscheint im Eigenschaftsfenster als weiße Flagge und wird im Graphikfenster ausgeblendet.

HINWEIS: Wenn Sie alle Warnkennzeichnungen unterdrücken, wird das Kennzeichnungssymbol in der Statusleiste weiß.

Wenn Sie einen Punkt gewählt haben, können Sie das Symbol Punktableitung [image]  verwenden, um den Punktableitungsbericht anzusehen.

Verwenden Sie den Bericht, um zu ermitteln, wie die Position des Punktes abgeleitet wurde und warum der Fehler aufgetreten ist.


Eigenschaftsfenster - Register Vermessung - Seiten Besetzungen und Einstellungen
Eigenschaftsfenster − Register Vermessung − Seiten Besetzungen und Einstellungen

Verwenden Sie die Seiten Besetzungen und Einstellungen, um die GPS-Besetzungsdetails oder terrestrischen Einstellungsdetails des gewählten Punktes oder der gewählten Beobachtung im Eigenschaftsfenster anzusehen und zu korrigieren.

Die folgenden Seiten sind verfügbar, abhängig vom gewählten Elementtyp und der verwendeten Feldmethode:

So greifen Sie auf diese Seiten im Eigenschaftsfenster zu:

1.	Wählen Sie die Beobachtung.

2.	Klicken Sie auf die Menü-Schaltfläche Besetzungen und Einstellungen [image].

HINWEIS: Wenn mehr als eine Besetzung oder Einstellung für den Punkt existiert, erscheint ein Verknüpfungsmenü. Wählen Sie die Seite, die Sie ansehen möchten. Sobald Sie die Maus über die verschiedenen Besetzungen und Einstellungen im Verknüpfungsmenü halten, werden die Details auf der Seite aktualisiert.

Ein Punkt kann mehr als eine Besetzung haben; eine Beobachtung kann jedoch nur einen “Von”-Punkt und einen “Zu”-Punkt haben.


Eigenschaftsfenster - Register Vermessung - Seite GPS-Besetzung
Eigenschaftsfenster − Register Vermessung − Seite GPS-Besetzung

Verwenden Sie die Seite GPS-Besetzung, um die GPS-Besetzungsdetails des gewählten Punktes anzusehen und zu korrigieren. Der Seiteninhalt ist derselbe, egal, ob der Punkt als Basisstation oder Rover-Position verwendet wurde.

So greifen im Eigenschaftsfenster darauf zu:

1.	Wählen Sie das Register Vermessung.

2.	Führen Sie einen der folgenden Schritte aus:

  Wenn Sie einen Punkt gewählt haben, klicken Sie auf die Menü-Schaltfläche Besetzungen und Einstellungen [image].

HINWEIS: Wenn mehr als eine Besetzung oder Einstellung für den Punkt existiert, erscheint ein Verknüpfungsmenü. Wählen Sie die Seite, die Sie ansehen möchten.

  Wenn eine GPS-Beobachtung gewählt ist, klicken Sie auf die Menü-Schaltfläche Besetzung Basis [image], um die Details der Basis-Besetzung anzusehen, oder klicken Sie auf die Menü-Schaltfläche Besetzung Rover [image], um die Details der Rover-Besetzung anzusehen.

Punkt

Zeigt den Namen des besetzten Punktes an.

Zeit

Zeigt die Länge (Zeitabschnitt) der Besetzung und die Startzeit der Besetzung an.

HINWEIS: Beim Datenimport werden die Start- und Endzeiten von GPS-Zeit zu UTC (Universal Time Coordinated — effektiv Greenwich Mean Time) konvertiert. Die Zeiten werden dann unter Verwendung der aktuellen, in Microsoft Windows eingestellten Zeitzone als Ortszeiten angezeigt.

TIP: Positionieren Sie den Pfeil über dem Feld, um eine QuickInfo mit der Stoppzeit der Besetzung anzuzeigen.

Antennendetails

Die Gruppe Antennendetails enthält Details der für die Besetzung des beobachteten Punktes verwendete GPS-Antenne.

Höhe

Zeigt die Antennenhöhe an. Wenn die Höhe während der Besetzung inkorrekt eingegeben wurde, verwenden Sie die Tastatur, um den korrekten Wert in dieses Feld einzugeben.

Typ

Zeigt den Typ der an den Empfänger angeschlossenen Antenne an. Wenn die Antenne während der Besetzung inkorrekt eingegeben wurde, wählen Sie einen Antennentyp aus der Liste, um dieses Feld zu ändern.

Gemessen bis

Zeigt an, bis wohin die Antennenhöhe gemessen wurde. Wenn die Methode während der Besetzung inkorrekt eingegeben wurde, wählen Sie eine Option aus der Liste, um dieses Feld zu ändern.


Eigenschaftsfenster - Register Vermessung - Seite Instrumentenstandpunkt
Eigenschaftsfenster − Register Vermessung − Seite Instrumentenstandpunkt

Verwenden Sie die Seite Instrumentenstandpunkt, um die Einstellungsdetails des für die Beobachtung verwendeten konventionellen Instruments anzusehen und zu korrigieren.

So greifen Sie im Eigenschaftsfenster darauf zu:

1.	Wählen Sie das Register Vermessung.

2.	Wenn ein Punkt gewählt ist, klicken Sie auf die Menü-Schaltfläche Besetzungen und Einstellungen [image].

HINWEIS: Wenn mehr als eine Besetzung oder Einstellung für den Punkt existiert, erscheint ein Verknüpfungsmenü. Wählen Sie die Seite Instrumentenstandpunkt, die Sie ansehen möchten. Alle GPS- und terrestrischen Besetzungen für diesen Punkt können auf dieser Seite angesehen werden.

Instrumentenpunkt

Zeigt den Namen des Punktes an, von dem aus die Beobachtung vorgenommen wurde.

Gerätehöhe

Zeigt die Höhe des Instruments zu dem Zeitpunkt an, als die Beobachtung durchgeführt wurde. Wenn die Höhe während der Messung inkorrekt eingegeben wurde, verwenden Sie die Tastatur, um einen korrekten Wert in dieses Feld einzugeben.

Rückbl.-Punkt

Zeigt den Namen des beobachteten Rückblick-Punkts an.

Rückbl.-Azimut

Zeigt den berechneten Azimut zum beobachteten Rückblick-Punkt an.

HINWEIS: Wenn der Rückblick-Punkt Koordinaten hat, werden diese verwendet, um den Azimut zum Rückblick-Punkt zu berechnen. Wenn ebenfalls ein Azimut eingegeben wurde, wird die Qualität dieses eingegebenen Azimuts mit der Qualität des Azimuts verglichen, der aus den Koordinaten des Rückblick-Punkts berechnet wurde. Der Azimut mit der besseren Qualität wird verwendet. Wenn der eingegebene und der berechnete Azimut dieselbe Qualität haben, wird der berechnete Azimut verwendet.


Eigenschaftsfenster - Register Vermessung - Seite Zielpunkt
Eigenschaftsfenster − Register Vermessung − Seite Zielpunkt

Verwenden Sie die Seite Zielpunkt, um die Einstellungsdetails des für die konventionelle Beobachtung verwendeten Ziels anzusehen und zu korrigieren.

So greifen Sie im Eigenschaftsfenster darauf zu:

1.	Wählen Sie im Register Vermessung die konventionelle Beobachtung

2.	Klicken Sie auf die Menü-Schaltfläche Zielpunkt [image], um die Zielpunktdetails anzusehen.

Vorbl.-Punkt

Zeigt den Namen des Vorblick-Punktes an.

Zielhöhe

Zeigt die Höhe des Ziels an, wenn die Vorblick-Beobachtung durchgeführt wurde. Wenn die Höhe während der Messung inkorrekt eingegeben wurde, verwenden Sie die Tastatur, um einen korrekten Wert in dieses Feld einzugeben.

Prismen-Konstante

Zeigt die Prismen-Konstante des Ziels an, die auf die Beobachtung angewendet wurde. Wenn die Konstante nicht eingegeben wurde oder während der Einrichtung falsch eingegeben wurde, verwenden Sie die Tastatur, um einen korrekten Wert in dieses Feld einzugeben.

In diesem Feld kann ein ‘?’ angezeigt werden, da auf die Beobachtung in der Datei bereits eine Prismen-Konstante angewendet wurde, die Prismen-Konstante aber nicht in der Datei festgelegt wurde. Wenn die Prismen-Konstante bei der Aufstellung/Einrichtung falsch eingegeben wurde, wenden Sie die Differenz zwischen der im Feld eingegebenen Prismen-Konstante und der tatsächlichen Prismen-Konstante an. Wenn Sie z. B. eine Prismen-Konstante von "20" eingegeben haben, und die tatsächliche Prismen-Konstante "5" beträgt, müssen Sie "–15" eingeben.


Eigenschaftsfenster - Register Vermessung - Seite GPS-Koordinate (APZ)
Eigenschaftsfenster − Register Vermessung − Seite GPS-Koordinate (APZ)

Verwenden Sie die Seite GPS-Koordinate (APZ), um eine GPS-Positionslösung anzusehen. Sie können eine Position erhalten durch:

  Differentielles GPS

  das Wide Area Augmentation System (WAAS)

  Verwenden der Taste [image] im Trimble Survey Controller

  Autonome Positionen

  VRS - Wide Area-RTK (Fixed und Float)

Positionslösungen werden für einen Punkt angezeigt, wenn sie Vermessungs- oder Kartographiegüte haben. Es können mehrere Positionslösungen angezeigt werden, diese Wert können jedoch nicht bearbeitet werden.

So greifen Sie im Eigenschaftsfenster darauf zu:

1.	Doppelklicken Sie im Graphikfenster auf den Punkt, der die GPS Koordinate (APZ) enthält.

2.	Expandieren Sie den Punkt in der Baumstruktur des Eigenschaftsfensters

3.	Wählen Sie die Lösung C?soln aus der Baumstruktur [image]. Das ? steht stellvertretend für die Koordinatennummer.

Die Seite GPS-Koordinate (APZ) wird angezeigt.

Punkt

Zeigt den Punktnamen an.

Breitengrad, Längengrad, Höhe

Zeigt die für den Punkt ermittelten WGS-84-Koordinaten und die Punktqualitäten an.

HINWEIS: Die angezeigte Höhe ist die Höhe des Antennenphasenzentrums der GPS-Antenne, die bei der Besetzung verwendet wurde. Die Antennenhöhe wird nicht angewendet.

Prozessor-Typ

Zeigt die Verarbeitungsmethode an, z. B. WAAS oder Wide Area RTK.

Status

Zeigt den Status der gewählten Positionslösung an. Der Status eines Punktes wird bei der Neuberechnung oder bei Vermessungsberechnungen berücksichtigt. Um dieses Feld zu ändern, klicken Sie auf den Pfeil, und wählen Sie die Option, die Sie auf den Punkt anwenden möchten, aus der Dropdown-Liste.


Eigenschaftsfenster - Register Vermessung - Seite Koordinate
Eigenschaftsfenster − Register Vermessung − Seite Koordinate

Weitere Informationen

 Siehe auch

Sie können die Seite Koordinate verwenden, um die Koordinaten eines gewählten Punktes anzusehen. Sie können diese Seite ebenfalls verwenden, um die Qualität und den Status der Koordinaten zu ändern.

Ein Punkt kann eine WGS-84 Koordinate, eine Gitter-/örtliche Koordinate und ausgeglichene Koordinaten haben. Eine ausgeglichene Koordinate kann angezeigt werden, nachdem Sie eine Netzausgleichung durchgeführt haben (wenn das Netzausgleichungsmodul auf Ihrem Computer installiert ist).

Verwenden Sie die Seite Zusammenfassung, um die Koordinaten für den Punkt anzusehen.

So greifen Sie auf die Seite Koordinate zu:

1. 	Doppelklicken Sie im Graphikfenster auf den Punkt. Das Eigenschaftsfenster erscheint.

2. 	Expandieren Sie die Baumstruktur des Punktes, und wählen Sie die Koordinate.

Die Koordinaten für den Punkt werden angezeigt.

Koordinatenfelder

Zeigen die Koordinatenkomponentenwerte des Punktes und die ihnen zugeordneten Qualitäten an. Die angezeigten Koordinatenfelder sind von der eingestellten Anzeigeoption abhängig. Sie können diese Felder nur bearbeiten, wenn die aktuelle Anzeigeeinstellung mit dem gespeicherten Koordinatentyp identisch ist.

Gitter / Örtlich / WGS-84

Wählen Sie die Koordinatenanzeigeoption für den Punkt.

HINWEIS: Wenn die Anzeigeoption auf WGS-84 eingestellt ist, sind die angezeigten Koordinatenfelder von der Einstellung im Feld „WGS-84 anzeigen als“ im Register Einheiten und Format des Dialogfeldes Projekteigenschaften abhängig. Wenn WGS-84 anzeigen als z. B. auf X,Y,Z eingestellt ist, wird das Koordinatenfeld auf der Seite Zusammenfassung als X,Y,Z angezeigt. Wenn WGS-84 anzeigen als z. B. auf B,L,H eingestellt ist, werden die WGS-84-Felder mit Breitengrad, Längengrad und Höhe beschriftet.

Qualitätsauswahlkontrolle

Verwenden Sie die Qualitätsauswahlkontrolle, um den Koordinatenkomponenten eine Qualität zuzuordnen. Die Qualitäten sind in absteigender Reihenfolge aufgelistet:

  Festpunkt

  Vermessung

  Kartographie

  Unbekannt

Status

Zeigt den Status des gewählten Punktes an. Der Status eines Punktes wird bei der Neuberechnung oder bei Vermessungsberechnungen berücksichtigt. Um dieses Feld zu ändern, klicken Sie auf den Pfeil und wählen Sie die Option, die Sie auf die Beobachtung anwenden möchten, aus der Dropdown-Liste.

Deaktivieren Sie eine Koordinate, wenn Sie diese nicht zur Ableitung der Punktposition verwenden möchten.

Aktivieren Sie eine Koordinate als Prüfpunkt, wenn Sie diese nur dann verwenden möchten, wenn keine anderen Beobachtungen oder Koordinaten zur Ableitung der Punktposition zur Verfügung stehen.

Der Neuberechnungsbericht enthält als Prüfpunkte aktivierte Koordinaten, jedoch keine deaktivierten Koordinaten.

Koordinatentyp

Die Koordinaten werden in dem von Ihnen gewählten Koordinatentyp in der Datenbank gespeichert. Wenn Sie die Koordinaten mit einem anderen Koordinatentyp speichern, werden bestehende Koordinaten desselben Typs überschrieben.


Eigenschaftsfenster - Register Vermessung - GPS-Beobachtungen
Eigenschaftsfenster − Register Vermessung − GPS-Beobachtungen

Sie können die Informationen über jeden GPS-Beobachtungstyp z. B. RTK, Statisch, FastStatic und Nachverarbeitet-kinematische Vektoren ansehen.

Verwenden Sie das Register Vermessung im Eigenschaftsfenster,  um die vermessungsbezogenen Informationen der ausgewählten GPS-Beobachtung anzusehen und zu bearbeiten. Die Vermessungsinformationen sind in Seiten unterteilt.

Sie können auf die folgenden Seiten durch Klicken auf die entsprechende Menü-Schaltfläche zugreifen:

Zusammenfassung
Warnung
Besetzung Basis
Besetzung Rover
Beobachtung
Beobachtungs-Statistiken


Eigenschaftsfenster - Register Vermessung - Seite Zusammenfassung (GPS-Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (GPS-Beobachtungen)

Die Seite Zusammenfassung faßt die Beobachtungsdetails der gewählten GPS-Beobachtung im Eigenschaftsfenster zusammen.

1.	Wählen Sie eine GPS-Beobachtung in der Vermessungsansicht.

2.	Klicken Sie auf die Menü-Schaltfläche Zusammenfassung [image], um im Eigenschaftsfenster darauf zuzugreifen.

Von

Zeigt den Namen des Referenzpunktes an, von dem aus die Messung vorgenommen wurde.

Zu

Zeigt den Namen des bewegten Punktes an, zu dem die Messung vorgenommen wurde.

Zeit

Zeigt die Länge (Zeitabschnitt) der Beobachtung und die Startzeit dieser Beobachtung an.

HINWEIS: Während des Datenimports werden die Start- und Endzeiten von GPS-Zeit zu UTC (Universal Time Coordinated — effektiv Greenwich Mean Time) konvertiert. Die Zeiten werden dann unter Verwendung der aktuellen, in Microsoft Windows eingestellten Zeitzone als Ortszeiten angezeigt.

TIP: Positionieren Sie den Pfeil über dem Feld, um eine QuickInfo mit der Stoppzeit der Besetzung anzuzeigen.

Prozessor-Typ

Zeigt den Verarbeitungstyp der gewählten Beobachtung an. Die Klassifizierung bezieht sich auf die Verarbeitung, die zur Berechnung der Beobachtungslösung verwendet wurde. Das Feld Prozessor-Typ kann sein:

  RTK

  Statisch oder FastStatic

  Nachverarbeitet kinematisch

  Nicht verarbeitet: weist darauf hin, daß die Beobachtungslösung vom Basislinienverarbeitungsprogramm zwar ermittelt werden könnte, aber nicht ermittelt wurde.

Feldmethode

Zeigt die für die Beobachtung verwendete GPS-Vermessungsmethode an.

  Topo

  Kontinuierlich

  Beob. Festpunkt

  Schnell

  Statisch oder FastStatic

  Ereignis

  Stop & Go

Status

Zeigt den Status der gewählten Beobachtung an. Der Status einer Beobachtung bei der Neuberechnung oder bei Vermessungsberechnungen berücksichtigt. Verwenden Sie dieses Feld, um fehlerhafte Beobachtungen (z. B. wenn sich durch die Beobachtung ein Abschlußfehler ergibt) zu deaktivieren.

Um dieses Feld zu ändern, klicken Sie auf den Pfeil, und wählen Sie die Option, die Sie auf die Beobachtung anwenden möchten, aus der Dropdown-Liste.

Deaktivieren Sie eine Koordinate, wenn Sie diese nicht zur Ableitung der Punktposition verwenden möchten.

Aktivieren Sie eine Koordinate als Prüfpunkt, wenn Sie diese nur dann verwenden möchten, wenn keine anderen Beobachtungen oder Koordinaten zur Ableitung der Punktposition zur Verfügung stehen.

Der Neuberechnungsbericht enthält als Prüfpunkt aktivierten Koordinaten, jedoch keine deaktivierten Koordinaten.

Bei der Netzausgleichung verwenden

Heben Sie die Markierung in diesem Kontrollkästchen auf, wenn Sie die gewählte Beobachtung nicht in einer Netzausgleichung verwenden möchten (wenn das Netzausgleichungsmodul installiert ist), die Koordinate aber noch bei einer Neuberechnung zur Berechnung der Datenbank verwendet werden soll.

Wenn die Beobachtung keine Kovarianzinformationen oder mittleren Fehler enthält, ist diese Option deaktiviert. Wenn die Beobachtung deaktiviert ist, steht die Option nicht zur Verfügung.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtung (GPS-Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Beobachtung (GPS-Beobachtungen)

Verwenden Sie die Seite Beobachtung, um die aktive Lösung zu wählen, und die Basislinienkomponenten für die gewählte Beobachtung anzusehen.

1.	Wählen Sie die Basislinie in der Vermessungsansicht.

2.	Klicken Sie auf die Menü-Schaltfläche Beobachtung [image], um im Eigenschaftsfenster darauf zuzugreifen.

Aktive Lösung

Zeigt die aktive Basislinienlösung an. Wenn Sie die Basislinie mehr als einmal unter Verwendung unterschiedlicher Verarbeitungsstile verarbeitet haben (wenn das Basislinienverarbeitungsmodul installiert ist), und im Dialogfeld GPS-Verarbeitung nicht die Option Doppelte Basislinienlösungen überschreiben gewählt wurde, kann die Basislinie mehr als eine Lösung aufweisen. Die Basislinie kann allerdings nur eine aktive Lösung haben. Diese Lösung wird bei der Neuberechnung und bei der Netzausgleichung verwendet. Klicken Sie auf den Pfeil, und wählen Sie die beste Lösung, die für die Beobachtung aktiv sein soll, aus der Dropdown-Liste.

TIP: Halten Sie den Mauszeiger über die Lösungen, um eine QuickInfo der Basislinienresultate anzuzeigen.

Lösungstyp

Zeigt den Lösungstyp der gewählten Beobachtung an.

dX, dY, dZ

Zeigt die Delta-Werte der GPS-Basislinie im Bezug auf das WGS-84-Kartesische Koordinatensystem an, wenn die Anzeigeoption auf XYZ eingestellt ist.

Ell. Azimut vorwärts, Ellipsoid-Strecke, Delta Höhe

Zeigt die GPS-Basislinienkomponenten im bezug auf das örtliche Ellipsoid an, wenn die Anzeigeoption auf Geodätisch eingestellt ist.

HINWEIS: Ell. Azimut vorwärts bezieht sich auf den ellipsoidischen Azimut vorwärts (geodätisch) in der Richtung vom Referenzpunkt zum bewegten Punkt.

dHo, dRe, dEllH

Zeigt die Werte für Delta Hochwert-, Rechtswert- und Höhe auf dem örtlichen geodätischen Horizont an, wenn die Anzeigeoption auf Ho/Re/Hö eingestellt ist.

Werte als Boden-zu-Boden anzeigen

Wählen Sie dieses Kontrollkästchen, um die auf Bodenhöhe berechneten Basislinienkomponentenwerte an der von den Empfängern an den Referenz- und Roving-Punkten besetzten Vermarkung anzuzeigen.

Wenn dieses Kontrollkästchen deaktiviert wird, werden die Werte der Basislinienkomponenten vom Referenz-Antennenphasenzentrum zum Rover-Antennenphasenzentrum angezeigt. Die folgende Abbildung stellt diesen Unterschied dar.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtung (Positionslösung)

Verwenden Sie die Seite Beobachtung, um die aktive Lösung auszuwählen und die Basislinienkomponenten für die gewählte Beobachtung anzusehen.

1.	Wählen Sie die Basislinie in der Vermessungsansicht.

2.	Klicken Sie auf die Menü-Schaltfläche Beobachtung [image], um im Eigenschaftsfenster darauf zuzugreifen.

Prozessor-Typ

Zeigt die Verarbeitungsmethode an, z. B. WAAS oder Wide Area RTK.

Feldmethode

Zeigt die im Feld verwendete Methode an, z. B. Kontinuierlich.

Lösungstyp

Zeigt den Lösungstyp für die gewählte Beobachtung an, z. B. L1 Float.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtungs-Statistiken
Eigenschaftsfenster − Register Vermessung − Seite Beobachtungs-Statistiken (GPS-Beobachtungen)

Die Seite Beobachtungs-Statistiken zeigt die entsprechenden Lösungsstatistiken und die Lösungsqualität abhängig vom gewählten Beobachtungstyp an. Die Statistiken für eine RTK-Beobachtung unterscheiden sich von denen einer statischen/nachverarbeiteten Beobachtung.

Verwenden Sie diese Seite, um die Qualität der Lösung zu überprüfen.

1.	Wählen Sie die Basislinie in der Vermessungsansicht.

2.	Klicken Sie auf die Menü-Schaltfläche Beobachtungs-Statistiken [image], um im Eigenschaftsfenster darauf zuzugreifen.

Wenn Sie eine RTK-Beobachtung ansehen, erscheinen die folgenden Felder auf der Seite Beobachtungs-Statistiken:

Anzahl Messungen

Zeigt die Anzahl der Messungen (Epochen) an, die erforderlich waren, um die Beobachtung abzuschließen.

Minimale Anzahl SVs

Zeigt die Mindestanzahl der Satelliten an, die von den Referenz- und Rover-Empfängern während einer Beobachtung verfolgt wurden.

RMS

Zeigt den quadratischen Mittelwert (Root Mean Square, RMS) an. Der RMS-Wert gibt die Genauigkeit der Messungen an, die zur Berechnung der Basislinienlösung verwendet wurden.

Schrägstrecke

Zeigt die Schrägstrecke der Beobachtung an.

Horizontale Genauigkeit

Zeigt die horizontale Genauigkeit der Messungen an, die verwendet wurden, um die Beobachtungslösung zu ermitteln.

Vertikale Genauigkeit

Zeigt die vertikale Genauigkeit der Messungen an, die verwendet wurden, um die Beobachtungslösung zu ermitteln.

PDOP/RDOP

Zeigt den Position Dilution of Precision (PDOP)-Wert für kinematische Basislinien oder den Relative Dilution of Precision (RDOP)-Wert für statische Basislinien an. Der RDOP nimmt mit zunehmender Beobachtungszeit ab.

Wenn Sie eine nachverarbeitete Basislinie ansehen, erscheinen die folgenden Felder auf der Seite Beobachtungs-Statistiken:

Verhältnis

Zeigt das Verhältnis von zwei Varianzen an, die bei der Ganzzahlsuche vom Basislinienverarbeitungsprogramm erzeugt wurden und für die Messungen am geeignetsten sind.

Referenzvarianz

Zeigt die Referenzvarianz an. Die Referenzvarianz ist eine Anzeige dafür, wie gut die beobachteten Daten für die Basislinie in die berechnete Lösung passen.

RMS

Zeigt den Mittleren quadratischen Fehler an (Root Mean Square). Der RMS-Wert drückt die Genauigkeit der Messungen aus, die verwendet wurden, um die Basislinienlösung zu ermitteln.

Schrägstrecke

Zeigt die für die Beobachtung ermittelte Schrägstrecke an.

Horizontale Genauigkeit

Zeigt die horizontale Genauigkeit der Messungen an, die verwendet wurden, um die Beobachtungslösung zu ermitteln.

Vertikale Genauigkeit

Zeigt die vertikale Genauigkeit der Messungen an, die verwendet wurden, um die Beobachtungslösung zu ermitteln.

RDOP

Zeigt den Wert der Relative Dilution of Precision an.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtungs-Statistiken (Positionslösung)

Die Seite Beobachtungs-Statistiken zeigt die entsprechende Lösungsstatistik und den Qualitätsindikator-Typ an.

Verwenden Sie diese Seite, um die Qualität der Lösung zu überprüfen:

1.	Wählen Sie die Basislinie in der Vermessungsansicht.

2.	Klicken Sie auf die Menü-Schaltfläche Beobachtungs-Statistiken [image], um im Eigenschaftsfenster darauf zuzugreifen.

Horizontale Genauigkeit

Zeigt die horizontale Genauigkeit an, die zur Ermittlung der Positionslösung verwendet wurde.

Vertikale Genauigkeit

Zeigt die vertikale Genauigkeit an, die zur Ermittlung der Positionslösung verwendet wurde.

RMS

Zeigt den quadratischen mittleren Fehler (RMS) an. Der RMS-Wert gibt die Genauigkeit der Messungen an, die zur Bestimmung der Basislinie verwendet wurden.

PDOP

Zeigt den Wert der Position Dilution of Precision (PDOP) für Basislinien an.

Mininmale Anzahl SV's

Zeigt die Mindestanzahl an Satelliten an, die während der Beobachtung verfolgt wurden, an.

Anzahl GPS-Positionen

Zeigt die Anzahl der in der Lösung verwendeten GPS-Positionen an.


Eigenschaftsfenster - Register Vermessung - Konventionelle Beobachtungen
Eigenschaftsfenster − Register Vermessung − Konventionelle Beobachtungen

Sie können die Informationen über jede terrestrische Beobachtung ansehen, die im Feld unter Verwendung eines konventionellen Instruments wie z. B. einer Totalstation oder einem Theodoliten gemessen wurde.

Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um die vermessungsbezogenen Informationen der gewählten konventionellen Beobachtung anzusehen und die Einstellungsdetails zu bearbeiten. Die Vermessungsinformationen sind in Seiten unterteilt.

Sie können auf die folgenden Seiten zugreifen, indem Sie auf die entsprechende Menü-Schaltfläche klicken:

Zusammenfassung
Zielpunkt
Beobachtung
Beobachtungs- Statistik

HINWEIS: Eine konventionelle Beobachtung wird in der Baumstruktur in der folgenden Reihenfolge angezeigt: Name des Rückblick-Punkts, Name des Instrumentenpunkts, Name des Vorblick-Punkts.


Eigenschaftsfenster - Register Vermessung - Seite Zusammenfassung (Konventionelle Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (Konventionelle Beobachtungen)

Die Seite Zusammenfassung faßt die Beobachtungsdetails der gewählten konventionellen Beobachtung im Eigenschaftsfenster zusammen.

1.	Wählen Sie die Beobachtung in der Vermessungsansicht.

2. 	Klicken Sie auf die Menü-Schaltfläche Zusammenfassung [image], um im Eigenschaftsfenster darauf zuzugreifen.

Instrumentenpunkt

Zeigt den Namen des Instrumentenstandpunkts , von dem aus die Beobachtung vorgenommen wurde.

Gerätehöhe

Zeigt die Höhe des Instruments an.

Rückbl.-Punkt

Zeigt den Namen des Punktes an, der als Rückblick-Punkt verwendet wurde.

Vorbl.-Punkt

Zeigt den Namen des Zielpunktes an, zu dem die Beobachtung durchgeführt wurde.

Status

Zeigt den Status der gewählten Beobachtung an. Der Status einer Beobachtung wird bei der Neuberechnung oder bei Vermessungsberechnungen berücksichtigt.

Um dieses Feld zu ändern, klicken Sie auf den Pfeil, und wählen Sie die Option, die Sie auf die Beobachtung angewendet haben möchten, aus der Dropdown-Liste.

Deaktivieren Sie eine Koordinate, wenn Sie diese nicht zur Ableitung der Punktposition verwenden möchten.

Wenn die Beobachtung ein Prüfpunkt für einen Rückblick-Punkt ist, aktivieren Sie die Beobachtung als  Prüfpunkt. Dies stellt sicher, daß ein Abschluß berichtet wird, aber die Beobachtung wird nicht verwendet, um die Koordinate zu bestimmen.

Der Neuberechnungsbericht enthält als Prüfpunkt aktivierte Koordinaten, jedoch keine deaktivierten Koordinaten.

Bei der Netzausgleichung verwenden

Deaktivieren Sie dieses Kontrollkästchen, wenn die ausgewählte Beobachtung nicht in eine Netzausgleichung eingeschlossen werden soll (wenn das Netzausgleichungsmodul auf Ihrem Computer installiert ist), Sie sie aber weiterhin bei Neuberechnungen verwenden möchten.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtung (Konventionelle Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Beobachtung (Konventionelle Beobachtungen)

Verwenden Sie die Seite Beobachtungen, um die Beobachtungskomponenten und Zielpunkteinstellungen für die gewählte Beobachtung anzusehen.

1.	Wählen Sie die Beobachtung in der Vermessungsansicht.

2.	Klicken Sie auf die Menü-Schaltfläche Beobachtung [image], um im Eigenschaftsfenster darauf zuzugreifen.

Rückbl.-Azimut

Zeigt den berechneten Azimut und die Qualität zwischen dem Instrumentenpunkt und dem Rückblick-Punkt an.

HINWEIS: Wenn der Rückblick-Punkt Koordinaten hat, werden diese verwendet, um den Azimut zum Rückblick-Punkt zu berechnen. Wenn ebenfalls ein Azimut eingegeben wurde, wird die Qualität dieses eingegebenen Azimuts mit der Qualität des Azimuts verglichen, der aus den Koordinaten des Rückblick-Punkts berechnet wurde. Der Azimut mit der besseren Qualität wird verwendet. Wenn der eingegebene und der berechnete Azimut dieselbe Qualität haben, wird der berechnete Azimut verwendet.

Horizontaler Winkel, Vertikaler Winkel, Schrägstrecke

Zeigt die beobachteten Werte der Beobachtungskomponenten an, wenn die Anzeigeoption auf HW,VW,SS eingestellt ist.

Azimut, Horizontale Strecke, Höhenunterschied

Zeigt die Werte der Beobachtungskomponenten an, die auf das Gitternetz-Koordinatensystem reduziert werden, wenn die Anzeigeoption auf AZ,HS,VS eingestellt ist.

HINWEIS: Während des Importvorgangs werden die atmosphärischen Korrekturen sowie Krümmungs- und Refraktionskorrekturen auf die Beobachtung angewendet. Die horizontale Beobachtung wird auf einen Winkel von dem Rückblick-Punkt reduziert. Der vertikale Winkel wird auf Krümmung und Refraktion hin korrigiert. Die PPM-Korrektur wird auf die Schrägstrecke angewendet.

Beobachtungstyp

Zeigt die Lage (L1, L2) des Instruments an, das für die Beobachtung verwendet wurde, oder die Beobachtungen in erster und zweiter Lage, wenn diese gemittelt wurden. Eine gemittelte Beobachtung ist der Mittelwert eines Beobachtungspaares in erster/zweiter Lage zwischen dem Rückblick-Punkt und dem beobachteten Punkt auf demselben Standpunkt.

Die Beobachtung kann ebenfalls aus einem mittleren gedrehten Winkel aus der Trimble Survey Controller-Software abgeleitet werden (z. B. wenn Satzbeobachtungen durchgeführt wurden).

Werte als Boden-zu-Boden anzeigen

Wählen Sie dieses Kontrollkästchen, um die Beobachtungen anzuzeigen, die auf Bodenvermarkungshöhen reduziert wurden, die vom Instrumenten- und Vorblick-Punkt besetzt wurden.


Eigenschaftsfenster - Register Vermessung - Nivellierbeobachtungen

Sie können Informationen über jede im Feld durchgeführte Nivellierbeobachtung anzeigen. Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um die vermessungsbezogenen Informationen einer gewählten Nivellierbeobachtung anzusehen.

Die Informationen im Register Vermessung sind in Seiten unterteilt. Klicken Sie auf die entsprechende Menü-Schaltfläche, um auf eine Seite zuzugreifen, wie nachstehend dargestellt:

Zusammenfassung
Beobachtungs- Statistik

HINWEIS: Wenn Sie eine Netzausgleichung unter Verwendung von Nivellierbeobachtungsdaten durchführen müssen, müssen mittlere Fehler für die Nivellierbeobachtungen definiert sein. Mittlere Fehler werden in folgenden Fällen berechnet:

  Wenn Sie digitale Nivellierdaten importieren, wird der mittlere Fehler unter Verwendung der Anzahl der Drehungen und des Fehlers der Nivellierlatten-Ablesung im Dialogfeld Ausgleichungsstil bearbeiten (Register Terrestrische Steuerungen) berechnet.

 Wenn Sie Nivellierdaten im Trimble Datenaustauschformat importieren. Wenn Sie die Anzahl der Drehungen im Trimble Datenaustauschformat angeben, wird der mittlere Fehler für Höhenunterschiede basierend auf der Anzahl der Drehungen berechnet. Wenn Sie den mittleren Fehler für Höhenunterschiede in das Trimble Datenaustauschformat einschließen, wird dieser Wert verwendet.

Wenn kein mittlerer Fehler definiert oder berechnet ist, stehen die Nivellierbeobachtungen nicht für eine Ausgleichung zur Verfügung.

Sie können den mittleren Fehler für jede Beobachtung im Eigenschaftsfenster eingeben.


Eigenschaftsfenster - Register Vermessung - Seite Zusammenfassung (Nivellierbeobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (Nivellierbeobachtungen)

Die Seite Zusammenfassung im Eigenschaftsfenster enthält die Beobachtungsdetails einer ausgewählten Nivellierbeobachtung.

1. 	Wählen Sie die Nivellierbeobachtung

2. 	Klicken Sie auf die Menü-Schaltfläche Zusammenfassung [image], um im Eigenschaftsfenster darauf zuzugreifen.

Von Punkt

Zeigt den Namen des Punktes an, von dem die Nivellierbeobachtung ausging.

Zu Punkt

Zeigt den Namen des Punktes an, zu dem die Nivellierbeobachtung durchgeführt wurde.

Höhenunterschied

Zeigt den Höhenunterschied zwischen den “Von”- und “Zu”-Punkten an.

Status

Wählen Sie aus der Liste den Status für die Beobachtungen. Dieser Status wird bei Neuberechnungen oder Vermessungsberechnungen berücksichtigt.

Wenn die Beobachtung als Prüfpunkt verwendet wurde, wählen Sie die Option Als Prüfpunkt aktiviert. Dadurch wird sichergestellt, daß ein Abschluß im Bericht enthalten ist, die Beobachtung aber nicht zur Bestimmung der orthometrischen Höhe verwendet wird. Deaktivieren Sie die Beobachtung, wenn sie nicht zur Bestimmung der Punktposition verwendet werden soll.

Im Neuberechnungsbericht werden dann nur als Prüfpunkt aktivierte Nivellierbeobachtungen angezeigt und keine deaktivierten Beobachtungen.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtungs-Statistiken (Nivellierbeobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Beobachtungs-Statistiken (Nivellierbeobachtungen)

Die Seite Beobachtungs-Statistiken enthält die entsprechenden Statistiken und Qualitätsindikatoren.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Beobachtungs-Statistiken [image]..

Mittlerer Fehler (Höhenunt.)

Dieser Wert zeigt den mittleren Fehler des Höhenunterschieds an. Der Fehler wird berechnet, wenn Sie:

  digitale Nivellier-Dateien importieren (der mittlere Fehler des Höhenunterschieds wird basierend auf der Anzahl der Drehungen und den Fehlern in der Nivellier-Lattenablesung berechnet.

  Wenn Sie Nivellierdaten im Trimble Datenaustauschformat importieren. Wenn Sie die Anzahl der Drehungen im Trimble Datenaustauschformat angeben, wird der mittlere Fehler für Höhenunterschiede basierend auf der Anzahl der Drehungen berechnet. Wenn Sie den mittleren Fehler für Höhenunterschiede in das Trimble Datenaustauschformat einschließen, wird dieser Wert verwendet.

Sie können auch einen eigenen Wert für den mittleren Fehler eingeben.

Anzahl Drehungen

Dies ist die Anzahl der Instrumenteneinstellungen, die zur Bestimmung des Höhenunterschieds zwischen den beiden Punkten erforderlich waren.

Linienlänge

Dies ist die Länge der Nivellierschleife. Sie wird durch Addition der Rückblick- und Vorblick-Strecken berechnet.


Eigenschaftsfenster - Register Vermessung - Laser-Entfernungsmesser-Beobachtungen
Eigenschaftsfenster − Register Vermessung − Laser-Entfernungsmesser-Beobachtungen

Sie können die vollständigen Informationen für jede terrestrische Beobachtung ansehen, die im Feld unter Verwendung eines Laser-Entfernungsmessers durchgeführt wurde.

Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um die vermessungsbezogenen Informationen der gewählten Laser-Entfernungsmesser-Beobachtung anzusehen und zu bearbeiten. Die Vermessungsinformationen sind in Seiten unterteilt.

Sie können auf die folgenden Seiten zugreifen, indem Sie auf die entsprechende Menü-Schaltfläche klicken:

Zusammenfassung
Beobachtung


Eigenschaftsfenster - Register Vermessung - Seite Zusammenfassung (Laser-Entfernungsmesser-Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (Laser-Entfernungsmesser-Beobachtungen)

Die Seite Zusammenfassung faßt die Beobachtungsdetails der gewählten Laser-Entfernungsmesser-Beobachtung im Eigenschaftsfenster zusammen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Zusammenfassung [image].

Instrumentenpunkt

Zeigt den Punkt an, von dem die Laser-Enternungsmesserbeobachtung ausgeht.

Gerätehöhe

Zeigt die Höhe des Instruments an.

Zielpunkt

Zeigt den Punkt an, zu dem die Laser-Entfernungsmesserbeobachtung durchgeführt wird.

Zielhöhe

Zeigt die Höhe des Zielpunktes an.

Status

Zeigt den Status der gewählten Beobachtung an. Der Status einer Beobachtung wird bei der Neuberechnung oder bei Vermessungsberechnungen berücksichtigt. Um dieses Feld zu ändern, klicken Sie auf den Pfeil, und wählen Sie die Option, die auf die Beobachtung angewendet werden soll, aus der Dropdown-Liste.

Deaktivieren Sie eine Koordinate, wenn Sie diese nicht zur Ableitung der Punktposition verwenden möchten.

Aktivieren Sie eine Koordinate als Prüfpunkt, wenn Sie diese nur dann verwenden möchten, wenn keine anderen Beobachtungen oder Koordinaten zur Ableitung der Punktposition zur Verfügung stehen.

Der Neuberechnungsbericht enthält als Prüfpunkt aktivierte Koordinaten, jedoch keine deaktivierten Koordinaten.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtung (Laser-Entfernungsmesser-Beobachtungen)
Eigenschaftsfenster − Register Vermessung  − Seite Beobachtung (Laser-Entfernungsmesser-Beobachtungen)

Verwenden Sie die Seite Beobachtung, um die Beobachtungskomponenten anzusehen und die magnetische Deklination zwischen dem Instrument und den für die gewählte Beobachtung verwendeten Zielpunkteinstellungen zu bearbeiten.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Beobachtung

Magnetischer Azimut

Zeigt den beobachteten magnetischen Azimut der Beobachtung an.

Deklination

Zeigt die magnetische Deklination zwischen magnetischem Norden und geographischem Norden an. Dieser Wert ist erforderlich, um den wahren Azimut zu ermitteln. Geben Sie einen Wert über die Tastatur ein, um dieses Feld zu ändern.

Vertikaler Winkel

Zeigt den vertikalen Winkel an, der bei der Beobachtung gemessen wurde. Wenn dieser Wert gleich Null ist, wird angenommen, daß die Strecke horizontal ist.

Schrägstrecke

Zeigt die Schrägstrecke der Beobachtung an.


Eigenschaftsfenster - Register Notiz
Eigenschaftsfenster − Register Notiz

 Überblick

Notiz-Datensätze sind nicht-graphische Elemente in der Datenbank. Das bedeutet, daß sie nicht angezeigt werden und nicht im Graphikfenster gewählt werden können.

Verwenden Sie das Register Notiz im Eigenschaftsfenster, um Notiz-Datensätze anzusehen und zu bearbeiten, wenn Sie ein Projekt aus Trimble Survey Controller importiert haben, das benutzerdefinierte Notizen enthält.

So greifen Sie darauf zu:

1.	Führen Sie einen der folgenden Vorgänge aus:

  Wählen Sie Wählen / Auswahlmengen. Wählen Sie die .dc-Datei, die die Notizen enthält, die Sie ansehen möchten.

  Wählen Sie Wählen / Nach Abfrage / Notizen.

3.	3.	3.	Öffnen Sie das Eigenschaftsfenster.

Das Eigenschaftsfenster zeigt alle Notizelemente mit einem Bleistift-Symbol an [image].


Eigenschaftsfenster - Register CAD (Punkte)
Eigenschaftsfenster − Register CAD (Punkte)

Verwenden Sie das Register CAD im Eigenschaftsfenster, um die CAD-bezogenen Informationen über den gewählten Punkt anzusehen und zu bearbeiten.

Layer

Zeigt den Layer an, dem der gewählte Punkt zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben.

Punktstil

Lassen Sie den Punktstil in der Liste anzeigen, oder wählen Sie ihn.

Kartiercode

Lassen Sie den Kartiercode-Wert für den gewählten Punkt anzeigen, oder geben Sie ihn ein.

Beschreibung

Lassen Sie die Beschreibung für den gewählten Punkt anzeigen, oder geben Sie sie ein.


Eigenschaftsfenster - Register Linie
Eigenschaftsfenster − Register Linie

Verwenden Sie das Register Linie, um die Felder des gewählten Linienelements anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Linienelement.

  Wählen Sie das Linienelement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Von

Zeigt den Namen des “Von”-Punktes der gewählten Linie an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Zu

Zeigt den Namen des “Zu”-Punktes der gewählten Linie an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Azimut

Zeigt den Azimut zwischen dem “Zu”- und “Von”-Punkt an.

Strecke

Zeigt die Strecke zwischen dem “Zu”- und “Von”-Punkt an.

Layer

Zeigt den Layer an, dem das gewählte Linienelement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben.

Linienstil

Zeigt den Linienstil der gewählten Linie an. Wählen Sie einen Linienstil aus der Liste, um dieses Feld zu ändern.


Eigenschaftsfenster - Register Kurve
Eigenschaftsfenster − Register Kurve

Verwenden Sie das Register Kurve, um die Felder des gewählten Kurvenelements anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Kurvenelement.

  Wählen Sie das Kurvenelement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Von

Zeigt den Namen des “Von”-Punktes der gewählten Kurve an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Zu

Zeigt den Namen des “Zu”-Punktes der gewählten Kurve an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Eingangstangente, Ausgangstangente

Zeigt die Tangenten der gewählten Kurve an. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um diese Felder zu ändern.

Rundung

Die Rundung definiert, die Krümmung der Kurve. Geben Sie einen Wert zwischen 0 und 1 ein, um dieses Feld zu ändern.

Layer

Zeigt den Layer an, dem das gewählte Kurvenelement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben.

Linienstil

Zeigt den Linienstil der gewählten Kurve an. Wählen Sie einen Linienstil aus der Liste, um dieses Feld zu ändern.


Eigenschaftsfenster - Register Bogen
Eigenschaftsfenster − Register Bogen

Verwenden Sie das Register Bogen, um die Felder des gewählten Bogens anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Bogenelement.

  Wählen Sie das Bogenelement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Von

Zeigt den Namen des “Von”-Punktes des gewählten Bogens an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Zu

Zeigt den Namen des “Zu”-Punktes des gewählten Bogens an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Mittelpunkt

Zeigt den Namen des “Mittelpunkt”-Punkts des gewählten Bogens an. Verwenden Sie die Tastatur für die Eingabe des Punktnamens, um dieses Feld zu ändern.

Hochwert, Rechtswert

Zeigt die Koordinaten im Mittelpunkt des Bogens an. Verwenden Sie die Tastatur für die Eingabe von Werten, um diese Felder zu ändern.

HINWEIS: Wenn der Mittelpunkt für den Bogen definiert wurde, werden die Koordinaten nicht verwendet. Es wird der Mittelpunkt verwendet.

Layer

Zeigt den Layer an, dem das gewählte Bogenelement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben und dieses Feld zu ändern.

Linienstil

Zeigt den Linienstil des gewählten Bogens an. Wählen Sie einen Linienstil aus der Liste, um dieses Feld zu ändern.

Bogen hat weniger als 180 Grad.

Dieses Kontrollkästchen ist gemäß Voreinstellung gewählt. Heben Sie die Markierung in diesem Kontrollkästchen auf, wenn der gewählte Bogenwinkel größer als 180 Grad sein soll.


Eigenschaftsfenster - Register Punktanmerkung
Eigenschaftsfenster − Register Punktanmerkung

Verwenden Sie das Register Punktanmerkung, um die Felder des gewählten, einem Punkt zugeordneten Anmerkungselements anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Anmerkungselement.

  Wählen Sie das Anmerkungselement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Punkt

Zeigt den Namen des Punktes an, dem das gewählte Anmerkungselement zugeordnet ist.

Textausdruck

Zeigt den Textausdruck des gewählten Anmerkungselements an. Der Textausdruck kann eine Textdefinition oder ein Feldcode sein, der in das Anmerkungsmuster eingefügt wurde. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Rechtswert, Hochwert

Zeigt die Koordinaten in bezug auf die voreingestellte Verankerungsposition “Basislinie links” des gewählten Anmerkungselements an. Verwenden Sie die Tastatur für die Eingabe von Werten, um diese Felder zu ändern.

Orientierung

Zeigt die Orientierung für das Anmerkungselement an. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Layer

Zeigt den Layer an, dem das gewählte Anmerkungselement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben und dieses Feld zu ändern.

Textstil

Zeigt den Textstil des gewählten Anmerkungselements an. Wählen Sie einen Textstil aus der Liste, um dieses Feld zu ändern.


Eigenschaftsfenster - Register Linienanmerkung
Eigenschaftsfenster − Register Linienanmerkung

Verwenden Sie das Register Linienanmerkung, um die Felder des gewählten, einem Linienelement zugeordneten Anmerkungselements anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Anmerkungselement.

  Wählen Sie das Anmerkungselement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Linie

Zeigt die Namen der Punkte an, die verwendet werden, um die Linie zu definieren, der das gewählte Anmerkungselement zugeordnet ist.

Textausdruck

Zeigt den Textausdruck des gewählten Anmerkungselements an. Der Textausdruck kann eine Textdefinition oder ein Feldcode sein, der in das Anmerkungsmuster eingefügt wurde. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Rechtswert, Hochwert

Zeigt die Koordinaten in bezug auf die voreingestellte Verankerungsposition “Basislinie links” des gewählten Anmerkungselements an. Verwenden Sie die Tastatur für die Eingabe von Werten, um diese Felder zu ändern.

Orientierung

Zeigt die Orientierung für das Anmerkungselement an. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Layer

Zeigt den Layer an, dem das gewählte Anmerkungselement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben, um dieses Feld zu ändern.

Textstil

Zeigt den Textstil des gewählten Anmerkungselements an. Wählen Sie einen Textstil aus der Liste, .


Eigenschaftsfenster - Register Bogen-Anmerkung
Eigenschaftsfenster − Register Bogen-Anmerkung

Verwenden Sie das Register Bogen-Anmerkung, um die Felder des gewählten, einem Bogenelement zugeordneten Anmerkungselements anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Anmerkungselement.

  Wählen Sie das Anmerkungselement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Bogen

Zeigt die Namen der Punkte an, die verwendet werden, um den Bogen zu definieren, dem das gewählte Anmerkungselement zugeordnet ist.

Textausdruck

Zeigt den Textausdruck des gewählten Anmerkungselements an. Der Textausdruck kann eine Textdefinition oder ein Feldcode sein, der in das Anmerkungsmuster eingefügt wurde. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Rechtswert, Hochwert

Zeigt die Koordinaten in bezug auf die voreingestellte Verankerungsposition “Basislinie links” des gewählten Anmerkungselements an. Verwenden Sie die Tastatur für die Eingabe von Werten, um diese Felder zu ändern.

Orientierung

Zeigt die Orientierung für das Anmerkungselement an. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Layer

Zeigt den Layer an, dem das gewählte Anmerkungselement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben und dieses Feld zu ändern.

Textstil

Zeigt den Textstil des gewählten Anmerkungselements an. Wählen Sie einen Textstil aus der Liste, um dieses Feld zu ändern.


Eigenschaftsfenster - Register Text
Eigenschaftsfenster − Register Text

Verwenden Sie das Register Text, um die Felder des gewählten Textelements anzusehen und zu bearbeiten.

Führen Sie einen der folgenden Vorgänge aus, um darauf von der Planansicht zuzugreifen:

  Doppelklicken Sie auf das Textelement.

  Wählen Sie das Textelement im Graphikfenster, und öffnen Sie das Eigenschaftsfenster.

Textausdruck

Zeigt den Textausdruck des gewählten Textelements an. Der Textausdruck kann eine Textdefinition oder ein eingefügter Feldcode sein. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Rechtswert, Hochwert

Zeigt die Koordinaten in bezug auf den angegebenen Verankerungstyp des gewählten Textelements an. Verwenden Sie die Tastatur für die Eingabe von Werten, um diese Felder zu ändern.

Orientierung

Zeigt die Orientierung für das Textelement an. Verwenden Sie die Tastatur für die Eingabe eines Wertes, um dieses Feld zu ändern.

Layer

Zeigt den Layer an, dem das gewählte Textelement zugeordnet ist. Wählen Sie einen Layer aus der Liste, oder verwenden Sie die Tastatur, um einen neuen Layer-Namen einzugeben und dieses Feld zu ändern.

Textstil

Zeigt den Textstil des gewählten Textelements an. Wählen Sie einen Textstil aus der Liste, um dieses Feld zu ändern.


Eigenschaftsfenster - Register Attribute
Eigenschaftsfenster − Register Attribute

Verwenden Sie das Register Attribute im Eigenschaftsfenster, um die Attribute in Ihrem Projekt zu verwalten. Das Eigenschaftsfenster läßt Sie Attribute in Trimble Geomatics Office ansehen, bearbeiten, hinzufügen und löschen.

Wählen Sie das Register Attribute, um darauf im Eigenschaftsfenster zuzugreifen.

HINWEIS: Sie müssen das Projekt für Attribute einrichten, bevor das Register Attribute verfügbar ist.

Hilfsmittel Attributauswahl

Das Hilfsmittel Attributauswahl zeigt das aktuelle, für den Punkt gewählte Attribut an. Wenn der Punkt mehr als ein assoziiertes Attribut aufweist, klicken Sie auf den Pfeil, und wählen Sie das Attribut, das Sie ansehen möchten, aus der Dropdown-Liste.

Attributname

Zeigt die Namen aller gewählten Attributeigenschaften an, die mit dem gewählten Punkt assoziiert sind.

Wert

Zeigt die Werte aller gewählten Attributeigenschaften an, die mit dem gewählten Punkt assoziiert sind. Um einen Attributwert zu bearbeiten, klicken Sie auf das entsprechende Feld, und wählen Sie einen Wert aus der Liste, oder verwenden Sie die Tastatur, um einen Wert in das Feld einzugeben, wenn keine Menüliste verfügbar ist.


Eigenschaftsfenster - Register Allgemein
Eigenschaftsfenster − Register Allgemein

Das Register Allgemein des Eigenschaftsfensters wird angezeigt, wenn Sie das Eigenschaftsfenster öffnen, ohne daß Elemente gewählt sind, oder wenn Sie mehr als ein Element in der Auswahlliste des Eigenschaftsfensters hervorgehoben haben.

Das Register Allgemein zeigt die Meldung “Keine Elemente ausgewählt“ an.

Wählen Sie ein Element im Graphikfenster oder aus der Auswahlliste im Eigenschaftsfenster, um seine Eigenschaften anzusehen.


Eigenschaftsfenster - Register Vermessung - Berechnete Beobachtungen
Eigenschaftsfenster − Register Vermessung − Berechnete Beobachtungen

Sie können die kompletten Informationen über berechnete terrestrische Beobachtungen wie z. B . Offsets ansehen, die im Feld unter Verwendung von Trimble Survey Controller durchgeführt wurden.

Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um die vermessungsbezogenen Informationen über die gewählte Beobachtung anzusehen und zu bearbeiten. Die Vermessungsinformationen sind in Seiten aufgeteilt.

Klicken Sie auf eine Menü-Schaltfläche, um im Register Vermessung auf eine Seite zuzugreifen. Auf die folgenden Seiten kann zugegriffen werden:

Zusammenfassung
Beobachtung


Eigenschaftsfenster - Register Vermessung - Seite Zusammenfassung (Berechnete Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (Berechnete Beobachtungen)

Die Seite Zusammenfassung faßt die Details der ausgewählten berechneten Beobachtung im Eigenschaftsfenster zusammen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Zusammenfassung [image].

Von

Zeigt den Namen des Punktes an, von dem aus die Messung vorgenommen wurde.

Zu

Zeigt den Namen des Punktes an, zu dem die Messung vorgenommen wurde.

Status

Zeigt den Status der gewählten Offset-Beobachtung an. Der Status einer Beobachtung wird bei der Neuberechnung oder bei Vermessungsberechnungen berücksichtigt. Um dieses Feld zu ändern, klicken Sie auf den Pfeil und wählen Sie die Option, die Sie auf die Beobachtung anwenden möchten, aus der Dropdown-Liste.


Eigenschaftsfenster - Register Vermessung - Seite Beobachtung (Berechnete Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Beobachtung (Berechnete Beobachtungen)

Verwenden Sie die Seite Beobachtung, um die Beobachtungskomponenten der berechneten Beobachtung anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Beobachtung [image].

Azimut

Zeigt den beobachteten Azimut der Beobachtung an.

Horizontale Strecke

Zeigt die gemessene horizontale Strecke der Beobachtung an.

Vertikale Strecke

Zeigt die gemessene vertikale Strecke der Beobachtung an.


Koordinaten - Überblick
Koordinaten − Überblick

Weitere Informationen

 Siehe auch

Wenn  Sie bekannte Koordinaten für einen Punkt in ein Trimble Geomatics Office Projekt eingeben, wird eine Koordinate zusammen mit anderen Vermessungsdaten für den Punkt gespeichert. Für jeden Punkt kann nur maximal eine  WGS-84 Koordinate und eine Gitter-/örtliche Koordinate vom Benutzer eingegeben werden.

Wenn Sie eine bestehende vom Benutzer eingegebene Koordinate bearbeiten, wird die alte Koordinate durch die neue ersetzt.

Folgende Optionen für die Eingabe bestehender Punkte stehen zur Verfügung:

  Eigenschaftsfenster / Schaltfläche Neue Koordinate hinzufügen [image] .

  das Dialogfeld Punkte (wenn das Netzausgleichungsmodul auf Ihrem Computer installiert ist)

  durch Importieren einer Datei mit Punktkoordinaten, die bereits in der Datenbank existieren.

So können Sie Koordinaten für neue Punkte mit eingegebenen Koordinaten eingeben:

  im Dialogfeld Punkte einfügen

  durch Importieren einer Datei mit Punktkoordinaten, die noch nicht in der Datenbank enthalten sind.

Alle in Trimble Geomatics Office eingegebenen Koordinaten werden als Koordinaten für den Punkt hinzugefügt und können in separaten Koordinatenseiten im Eigenschaftsfenster angesehen werden.

HINWEIS: Um die Punktposition anzusehen, verwenden Sie die Seite Zusammenfassung. Die eingegebene Koordinate wird zur Punktpositionierung verwendet, wenn sie dieselbe (oder eine bessere) Qualität aufweist, wie die Beobachtungen, die zum Punkt durchgeführt wurden.


Eigenschaftsfenster - Register Absteckung - Überblick
Eigenschaftsfenster − Register Absteckung − Überblick

Das Register Absteckung enthält Informationen über Punkte, die im Feld mit Trimble Survey Controller abgesteckt wurden. Folgende Seiten stehen im Register Absteckung zur Verfügung:

  Deltas wie abgesteckt

  Lineare Details

  Geländeschnittpunkt

  Reißbrett

  DGM


Eigenschaftsfenster - Register Absteckung - Seite Deltas wie abgesteckt
Eigenschaftsfenster − Register Absteckung − Seite Deltas wie abgesteckt

Verwenden Sie die Seite Deltas wie abgesteckt, um die Unterschiede zwischen der Lage des Sollpunkts und des abgesteckten Punkts anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Absteckung auf die Menü-Schaltfläche Deltas wie abgesteckt [image].

Methode

Dieses Feld zeigt die abgesteckten Elemente an, z. B. einen Punkt, eine Linie, einen Bogen oder eine Trasse.

Wenn die Option Polar gewählt ist, werden folgende Felder angezeigt:

Azimut

Dieses Feld zeigt den Azimut vom Sollpunkt zum abgesteckten Punkt an.

Länge

Dieses Feld zeigt die Strecke vom Sollpunkt zum abgesteckten Punkt an.

Wenn die Option Gitter-Deltas gewählt ist, werden folgende Felder angezeigt:

Delta-Hochwert

Dieses Feld zeigt den Hochwert-Unterschied zwischen dem Sollpunkt und dem abgesteckten Punkt an.

Delta-Rechtswert

Dieses Feld zeigt den Rechtswert-Unterschied zwischen dem Sollpunkt und dem abgesteckten Punkt an.

Wenn die Option Stn und Offset gewählt ist, werden folgende Felder angezeigt:

Delta-Station

Dieses Feld zeigt den Streckenunterschied (parallel zur Soll-Mittellinie) zwischen dem Sollpunkt und dem abgesteckten Punkt an.

Delta-Offset

Dieses Feld zeigt den Streckenunterschied (im rechten Winkel zur Soll-Mittellinie) zwischen dem Sollpunkt und dem abgesteckten Punkt an.

Höhenunterschied

Dieses Feld zeigt den Höhenunterschied zwischen dem Sollpunkt (am abzusteckenden Punkt) und dem abgesteckten Punkt an.

Abtrag/Auftrag

Dieses Feld zeigt den Höhenunterschied zwischen dem Sollpunkt (am tatsächlich abgesteckten Punkt) und dem abgesteckten Punkt an.

Die Werte für den Höhenunterschied und Abtrag/Auftrag sind dieselben. Eine Ausnahme besteht wenn :

  Die Solloberfläche keine horizontale Ebene ist, und

  der horizontale Fehler beim Abstecken des Punktes einen großen Fehler enthält

Die folgende Abbildung veranschaulicht den Unterschied zwischen dem Höhenunterschied und Abtrag/Auftrag, wenn die Solloberfläche keine horizontale Ebene ist.

Wenn der abgesteckte Punkt ein Geländeschnittpunkt war, sind die im Bericht enthaltenen Deltas die Deltas von der abgesteckten Position zum berechneten Geländeschnittpunkt.


Eigenschaftsfenster - Register Absteckung - Lineare Details
Eigenschaftsfenster − Register Absteckung − Lineare Details

Verwenden Sie die Seite lineare Details, um die Absteckungsdetails eines linearen Merkmals (z. B. einer Linie, eines Bogens oder einer Trasse) anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Absteckung auf die Menü-Schaltfläche Lineare Details [image].

Name

Dieses Feld zeigt den Namen des linearen Merkmals an, von dem der Punkt abgesteckt wird.

Station

Dieses Feld zeigt die Sollstation des für die Absteckung gewählten Punktes an.

Horizontaler Offset

Dieses Feld zeigt das horizontale Offset vom Sollpunkt zum abgesteckten Punkt an. Für eine Trasse zeigt dieses Feld die horizontale Baufreiheit an.

Vertikaler Offset

Dieses Feld zeigt das vertikale Offset vom Sollpunkt zum abgesteckten Punkt an. Für eine Trasse zeigt dieses Feld die vertikale Baufreiheit an.

Wenn eine Trasse abgesteckt wurde, werden die folgenden Felder ebenfalls angezeigt:

Soll-Offset

Dieses Feld zeigt das Soll-Offset des abzusteckenden Punktes an.

Sollhöhe

Dieses Feld zeigt die Sollhöhe des abzusteckenden Punktes an.

Merkmalsname

Dieses Feld zeigt den Merkmalsnamen an.

Horz Offset-Methode

Dieses Feld zeigt an, wie das horizontale Offset angewendet wurde. Das horizontale Offset kann folgendermaßen angewendet werden:

  horizontal

  am Gefälle des vorhergehenden Regelquerschnittselements


Eigenschaftsfenster - Register Absteckung - Geländeschnittpunkt
Eigenschaftsfenster − Register Absteckung − Geländeschnittpunkt

Verwenden Sie die Seite Geländeschnittpunkt, um Details über den Geländeschnittpunkt anzusehen. Diese Option steht nur zur Verfügung, wenn der abgesteckte Punkt ein Geländeschnittpunkt auf einer Trasse war.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Absteckung auf die Menü-Schaltfläche Geländeschnittpunkt [image].

Der Schnittpunkt der Solloberfläche mit der natürlichen Oberfläche wird als Geländeschnittpunkt bezeichnet. Im nachstehenden Diagramm ist ein typisches Trassenquerprofil abgebildet:

wobei:

A = die Strecke bis zur Mittellinie

B = die horizontale Strecke vom Geländeschnittpunkt zum Angelpunkt

C = die vertikale Strecke vom Geländeschnittpunkt zum Angelpunkt

D = das Seitengefälle

E = die Schrägstrecke zum Angelpunkt

F = die horizontale Baufreiheit

G = die Grabenbreite

H = der Angelpunkt

J = der Geländeschnittpunkt ist.

Seitengefälle

Dieses Feld zeigt den Wert des Seitengefälles an.

Grabenbreite

Dieses Feld zeigt den Wert der Grabenbreite an. Die Grabenbreite ist im vorstehenden Diagramm als “G” gekennzeichnet.

Seitengefälletyp

Dieses Feld zeigt den Seitengefälletyp an (z. B. Abtrag oder Auftrag).

Horz Strecke bis Mittellinie

Dieses Feld zeigt die horizontale Strecke vom abgesteckten Geländeschnittpunkt bis zur Mittellinie an.

Höhe

Dieses Feld zeigt die abgesteckte Höhe des Geländeschnittpunkts an.

Horizontale Strecke zu Angelpunkt

Dieses Feld zeigt die horizontale Strecke vom Geländeschnittpunkt zum Angelpunkt an.

Vertikale Strecke zu Angelpunkt

Dieses Feld zeigt die vertikale Strecke vom Geländeschnittpunkt zum Angelpunkt an.

Schrägstrecke zu Angelpunkt

Dieses Feld zeigt the Schrägstrecke vom Geländeschnittpunkt zum Angelpunkt an.

Schrägstr. + Baufreiheit

Dieses Feld zeigt die Schrägstrecke vom abgesteckten Punkt zum Angelpunkt an. Im vorstehenden Diagramm ist sie als Schrägstrecke vom Angelpunkt “H” zu einem definierten Punkt dargestellt. Dieser Punkt wird durch die Projektion des Seitengefälles definiert. Es ist der Punkt, an dem sich das Seitengefälle mit der abgesteckten Position überschneidet. Dieser Wert wird als Null (?) angezeigt, wenn:

  keine horizontale Baufreiheit angewendet wird

  die horizontale Baufreiheit horizontal angewendet wird


Eigenschaftsfenster - Register Absteckung - Reißbrett
Eigenschaftsfenster − Register Absteckung − Reißbrett

Verwenden Sie die Seite Reißbrett, um die Strecken vom Geländeschnittpunkt zu Punkten auf dem Regelquerschnitt anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Absteckung auf die Menü-Schaltfläche Reißbrett [image].

Name

Dieses Feld zeigt den Namen des Punkts auf dem Regelquerschnitt an.

Horizontale Strecke von Geländeschnittpunkt

Dieses Feld zeigt die horizontale Strecke vom Geländeschnittpunkt zum Punkt auf dem Regelquerschnitt an.

Vertikale Strecke von Geländeschnittpunkt

Dieses Feld zeigt die vertikale Strecke vom Geländeschnittpunkt zum Punkt auf dem Regelquerschnitt an.


Eigenschaftsfenster - Register Absteckung - DGM
Eigenschaftsfenster − Register Absteckung − DGM

Verwenden Sie die Seite DGM, um Details über die abgesteckten DGM-Punkte anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Absteckung auf die Menü-Schaltfläche DGM [image].

DGM-Name

Dieses Feld zeigt den Namen des DGMs an.

Vertikaler Offset

Dieses Feld zeigt das angegebene vertikale Offset zwischen dem DGM und der abzusteckenden Oberfläche an.

Abtrag/Auftrag

Dieses Feld zeigt den Höhenunterschied zwischen dem DGM (einschließlich des vertikalen Offsets) und dem abgesteckten Punkt an.


Eigenschaftsfenster - Register Vermessung - Azimut-Beobachtungen
Eigenschaftsfenster − Register Vermessung − Azimut-Beobachtungen

Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um Azimut-Beobachtungen anzusehen und zu bearbeiten. Die Vermessungsinformationen sind in Seiten aufgeteilt.

Sie können auf die folgenden Seiten zugreifen, indem Sie auf die entsprechende Menü-Schaltfläche klicken:

Zusammenfassung
Warnung
Beobachtungs- Statistiken


Eigenschaftsfenster ? Register Vermessung ? Seite Zusammenfassung (Azimut-Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Zusammenfassung (Azimut-Beobachtungen)

Die Seite Zusammenfassung enthält eine Zusammenfassung der Beobachtungsdetails der im Eigenschaftsfenster ausgewählten Azimut-Beobachtung.

1.	Wählen Sie die Azimut-Beobachtung in der Vermessungsansicht

2.	Klicken Sie auf die Menüschaltfläche Zusammenfassung [image], um vom Eigenschaftsfenster aus darauf zuzugreifen.

HINWEIS: Azimut-Beobachtungen wird das Präfix AZ vorangestellt.

Von Punkt

Zeigt den Namen des Referenzpunktes an, von dem die Beobachtung ausging.

Zu Punkt

Zeigt den Namen des Punktes an, zu dem die Azimut-Beobachtung durchgeführt wurde.

Azimut

Dieses Feld zeigt den Azimut zwischen den "Von"- und "Zu"-Punkten an. Ein Gitter- oder ellipsoidischer Azimut vorwärts kann angezeigt werden. Dieses Feld kann nur bearbeitet werden, wenn der Azimuttyp und die Felder in der Azimutansicht dieselben sind.

Qualität

Dieses Feld zeigt die Qualität der Azimut-Beobachtung an.

Azimuttyp

Diese Gruppe gibt an, ob der Azimut in der Datenbank als Gitter- oder ellispoidischer Azimut vorwärts gespeichert wird. Sie können dieses Feld nicht bearbeiten.

HINWEIS: Wenn der "Zu"-Punkt keinen Azimut hat, kann die Konvertierung zwischen dem Gitter-Azimut und dem ellipsoidischen Azimut vorwärts nicht berechnet werden. In diesem Fall wird Null (?) für den Azimut angezeigt.

Azimutanzeige

Verwenden Sie diese Ansichtsoptionen, um festzulegen, wie der Azimut im Eigenschaftsfenster angezeigt wird:

  Gitter − wählen Sie diese Option, um den Gitter-Azimut anzuzeigen.

  Ellipsoidisch vorw − wählen Sie diese Option, um den ellipsoidischen Azimut vorwärts anzuzeigen

HINWEIS: Damit Sie das Feld Azimut bearbeiten können, müssen die Informationen im Feld Azimuttyp und diese Ansichtsoptionen dieselben sein.

Status

Wählen Sie aus der Liste den Status für Ihre Beobachtungen. Dieser Status wird bei Neuberechnung und Vermessungsberechnungen berücksichtigt.

Wenn die Beobachtung als Prüfpunkt verwendet wurde, wählen Sie die Option Als Prüfpunkt aktiviert. Dadurch wird sichergestellt, daß ein Abschluß im Bericht enthalten ist, die Beobachtung aber nicht zur Bestimmung der orthometrischen Höhe verwendet wird. Deaktivieren Sie die Beobachtung, wenn sie nicht zur Bestimmung der Punktposition verwendet werden soll (z. B. wenn sich durch die Beobachtung ein Abschlußfehler ergibt).

Im Neuberechnungsbericht werden dann nur als Prüfpunkt aktivierte Nivellierbeobachtungen angezeigt und keine deaktivierten Beobachtungen.

Bei der Netzausgleichung verwenden

Deaktivieren Sie dieses Kontrollkästchen, wenn die ausgewählte Beobachtung nicht in eine Netzausgleichung eingeschlossen werden soll (wenn das Netzausgleichungsmodul auf Ihrem Computer installiert ist), Sie sie aber weiterhin bei Neuberechnungen der Datenbank verwenden möchten.


Eigenschaftsfenster ? Register Vermessung ? Seite Beobachtungs-Statistiken (Azimut-Beobachtungen)
Eigenschaftsfenster − Register Vermessung − Seite Beobachtungs-Statistiken (Azimut-Beobachtungen)

Die Seite Beobachtungs-Statistiken enthält die entsprechenden Lösungsstatistiken und Qualitätsindikatoren, abhängig vom gewählten Beobachtungstyp. Für Azimut-Beobachtungen wird der mittlere Fehler angezeigt. Verwenden Sie diese Seite, um die Qualität der Lösung zu überprüfen. So greifen Sie im Eigenschaftsfenster darauf zu :

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Beobachtungs-Statistiken [image].

Mittlerer Fehler

Verwenden Sie dieses Feld, um den mittleren Fehler der Azimut-Beobachtung einzugeben

HINWEIS: Bei einem mittleren Fehler von 0°00'00" wird der Azimut bei der Ausgleichung korrigiert.


Koordinaten im Eigenschaftsfenster

Mit Trimble Geomatics Office können Sie unter Verwendung der Schaltfläche Koordinate hinzufügen [image] für einen Punkt im Eigenschaftsfenster Koordinaten hinzufügen. Wenn Sie auf diese Schaltfläche klicken, erscheint ein Verknüpfungsmenü. Wählen Sie aus diesem Menü den Koordinatentyp, den Sie hinzufügen möchten: WGS-84, Gitter oder Örtlich. Die gespeicherten Punktkoordinaten und die Koordinatenquelle werden in der linken Baumstrukturliste im Eigenschaftsfenster angezeigt.

Es kann nur eine begrenzte Anzahl an eingegebenen Koordinaten mit einem Punkt verknüpft werden. Sie können nur eine WGS-84 Koordinate und eine Gitter-/örtliche Koordinate für jeden Punkt eingeben. Wenn Sie bereits eine WGS-84 Koordinate eingegeben haben, steht diese Option nicht zur Verfügung.

Fügen Sie nur dann eine Koordinate hinzu, wenn Sie sicher sind, daß Sie diese Koordinate anstelle von Beobachtungen verwenden möchten, da bei Neuberechnungen eingegebene Koordinaten Vorrang vor Beobachtungen mit derselben Qualität haben. Dadurch wird sichergestellt, daß ein Sollpunkt anstelle einer abgesteckten Beobachtung verwendet wird.

HINWEIS: Dem eingegebenen Koordinatennamen wird ein Präfix vorangestellt, das angibt, ob es sich um eine Gitter-(G), örtliche (L) oder eine WGS-84 (W) Koordinate handelt.

In Trimble Geomatics Office können zusätzliche Koordinaten für einen Punkt erzeugt und gespeichert werden. Dies sind:

  Koordinaten, die aus einer Ausgleichung abgeleitet wurden

  ausgeglichene WGS-84 Koordinaten, die für eine Kalibrierung gespeichert wurden

Wenn Sie eine Koordinate hinzufügen, werden die Koordinatenkomponenten als Null (?) angezeigt.  Sie können die Schaltfläche Aktuellen Wert einfügen [image], verwenden, um den aktuellen Wert und die Qualität der Koordinatenkomponenten, die in der Seite Zusammenfassung angezeigt werden, in jedes Koordinatenkomponenten-Feld einzugeben. Diese Schaltfläche steht nur zur Verfügung, wenn Sie das auszufüllende Koordinatenkomponenten-Feld gewählt haben.

Koordinaten bearbeiten

Sie können eingegebene Koordinaten bearbeiten. Sie können jedoch keine zusätzlich eingegebenen Koordinaten bearbeiten, z. B. Ausgleichungs- und Kalibrierungskoordinaten, die von der Software erzeugt werden.

Sie können nur Koordinatenkomponenten bearbeiten, wenn die aktuelle Ansicht der Koordinatentyp-Einstellung im Feld Speichern unter entspricht. Wenn Koordinatenkomponenten bearbeitet werden, ändert sich die Koordinatenquelle. Sie wird als im Büro eingegebene Koordinate angezeigt, oder mit mehreren Quellen angegeben, wenn nur einige der Komponenten bearbeitet werden.

Koordinaten aus unterschiedlichen Quellen

Die Quelle einer Koordinate wird im Eigenschaftsfenster angezeigt. Wenn eine Koordinate aus zwei oder mehreren Quellen abgeleitet wurde, werden mehrere Quellen angezeigt. Wenn z. B. die horizontale Koordinate eines Punktes aus einer importierten Datei abgeleitet und die ellipsoidische Höhe in Trimble Geomatics Office eingegeben wurde, wird angezeigt, daß die Koordinaten des Punktes aus mehreren Quellen abgeleitet wurden.

TIP: Sie können die QuickInfo in der Koordinatenseite verwenden, um die Quelle der einzelnen Koordinatenkomponenten zu prüfen.

Koordinaten verschieben

Wenn eine Koordinate in Trimble Geomatics Office verschoben oder transformiert wird, werden alle Beobachtungen deaktiviert. Sie müssen die Koordinaten wieder aktivieren, wenn Sie sie erneut berechnen möchten. Verwenden Sie dazu das Dialogfeld Mehrfachbearbeitung..

Koordinaten löschen

Sie können die Schaltfläche Löschen [image] verwenden, um eine Koordinate zu löschen.

HINWEIS: Koordinaten, die für eine Ausgleichung festgehalten wurden, können nicht bearbeitet werden.

Koordinatenqualität

Jeder Koordinate, die im Eigenschaftsfenster angezeigt wird, wurde eine Koordinatenqualität zugewiesen. Folgende Koordinatenqualitäten können bearbeitet werden:

  Festpunktgüte

  Vermessungsgüte

  Kartographiegüte

  Unbekannte Güte

Die Qualität eines bedingten Festpunkts kann nicht geändert werden.


Eigenschaftsfenster - Register Vermessung - Seite Ereignisse
Eigenschaftsfenster − Register Vermessung − Seite Ereignisse

Verwenden Sie das Register Vermessung im Eigenschaftsfenster, um Ereignisdaten anzusehen.

So greifen Sie im Eigenschaftsfenster darauf zu:

  Klicken Sie im Register Vermessung auf die Menü-Schaltfläche Ereignisse [image].

Empfänger-Ereignis-ID

Dieses Feld die Ereignis-ID an.

Interpolationsmethode

Dieses Feld zeigt an, ob die Interpolationsmethode linear oder quadratisch ist.

Punkte in Anpassung

Dieses Feld zeigt die Anzahl der Punkte an, die zur  Kurvenanpassung des Interpolationsbogens verwendet wurden.

Empfänger-Schnittst.-ID

Dieses Feld zeigt die Schnittstellen-ID des Empfängers an.

Lösungstyp

Dieses Feld zeigt den Lösungstyp an

RMS

Dieses Feld zeigt den RMS-Wert an.

Status

Wählen Sie den Status für die Beobachtung aus der Liste. Dieser Status wird bei Neuberechnung und Vermessungsberechnungen berücksichtigt.


Eigenschaftsfenster - Register Station und Offset
Eigenschaftsfenster − Register Station und Offset

Das Register Station und Offset zeigt Informationen über Punkte an, die mit einem Stations- und Offset-Programm in einem Trimble-Gerät gemessen wurden.

Führen Sie im Eigenschaftsfenster folgendes aus:

1.	Wählen Sie das Register Station und Offset.

2.	Klicken Sie auf die Schaltfläche Station/Offset.

Name

Dieses Feld enthält den Namen des linearen Merkmals.

Station

Dieses Feld enthält die Station auf dem linearen Merkmal für den gemessenen Punkt.

HINWEIS: Wenn bei der Verwendung eines Trimble 3300-Instruments eine Baufreiheit von der Referenzlinie angewendet wird, wird das Offset im Namensfeld neben dem Start- und Endpunkt der Linie angezeigt.

Offset

Dieses Feld enthält das Offset vom linearen Merkmal für den gemessenen Punkt.

Delta Höhe

Dieses Feld enthält den orthometrischen Höhenunterschied zwischen der Station auf dem linearen Merkmal und dem gemessenen Punkt.


GPS-Kalibrierung - Überblick
        GPS-Kalibrierung − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld
Überblick

Bei einer GPS-Kalibrierung wird eine Beziehung hergestellt zwischen den mit GPS-Empfängern aufgezeichneten WGS-84-Daten und örtlichen Festpunktpositionen (angegeben als örtliches Kartengitter mit Höhen über Normalnull). Diese Beziehung ist durch eine Reihe mathematischer Transformationen definiert. Die Funktion GPS-Kalibrierung ermöglicht es Ihnen, GPS- und örtliche Festpunktpaare zu bilden, die in der Kalibrierung verwendet werden sollen (die GPS-Koordinaten müssen aus GPS-Punkten und -Beobachtungen abgeleitet, und die Gitterpunkte müssen aus Gitter- und terrestrischen Beobachtungen abgeleitet werden). Trimble Geomatics Office berechnet und wendet die mathematischen Transformationen nach der Methode der kleinsten Quadrate an. Sie können jederzeit nachkalibrieren.

Die mathematischen Transformationen, die angewendet werden, um WGS-84-Positionen in Gitter-Koordinaten zu konvertieren, sind:

1.	Eine Datum-Transformation, um die WGS-84 Breiten-, Längen- und ellipsoidische Höhen-Koordinaten in Breiten-, Längen- und ellipsoidische Höhen-Koordinaten relativ zum Ellipsoid des örtlichen Kartengitters zu konvertieren.

2.	Eine Kartenprojektion, um die örtlichen Ellipsoid-Breiten- und -Längengrad-Koordinaten in örtliche Kartengitter-Hochwert- und -Rechtswert-Koordinaten zu konvertieren (der Wert der ellipsoidischen Höhe wird bei diesem Vorgang im allgemeinen nicht verändert).

3.	Ein Geoidmodell auf WGS-84 Höhe, um die ungefähre Höhe über dem Meeresspiegel zu erhalten.

4.	Eine horizontale Ausgleichung der transformierten Gitter-Koordinaten, um sie am besten den örtlichen Festdaten anzupassen. Diese Ausgleichung erlaubt örtliche Abweichungen im Projektionssystem, die nicht durch die allgemeine Datum-Transformation abgedeckt sind.

5.	Eine Höhenausgleichung, um die Höhen über dem örtlichen Ellipsoid oder orthometrische Höhen, die aus dem Geoid zu örtlichen Festpunkthöhen über Normalnull zu konvertieren.

Verwenden Sie die Registrierung (Registry) des Computers, um die Kalibrierungseinstellungen (die die maximalen erlaubten Restwerte definieren) zu ändern.

Die vorstehenden horizontalen und vertikalen Ausgleichungen werden als Teil der Koordinatensystem-Definition für das Projekt gespeichert. Alle GPS-Punkte in der Datenbank werden unter Anwendung der Kalibrierungsparameter aktualisiert, was zu genaueren örtlichen Gitternetz-Koordinatenwerten führt.

Um die neue Definition des Koordinatensystems (die die Kalibrierungsparameter enthält) als örtliche Anpassung für die Verwendung in zukünftigen Projekten im gleichen Gebiet zu speichern, klicken Sie im Dialogfeld GPS-Kalibrierung auf Speichern.

Wenn Sie eine Kalibrierung als örtliche Anpassung speichern, mit der Absicht, die örtliche Anpassung in einem anderen Projekt zu verwenden, stellen Sie sicher, daß die Fläche des Projekts vollständig von den in der Kalibrierung verwendeten Punkten umschlossen ist. Beispiel: Im folgenden Diagramm ist es zulässig, die Definition der örtlichen Anpassung für Projekt B, nicht aber für Projekt C zu verwenden.

Wenn Sie die [image] -Taste im Trimble Survey Controller verwenden, um eine Echtzeit-kinematische (RTK)-Basis zu starten und die Survey Controller-Datei (.dc) zu Trimble Geomatics Office übertragen, hat die Basis-Position (und damit alle Rover-Punkte von der Basis) eine unbekannte Qualität (für alle Komponenten, horizontal, ellipsoidische und orthometrische Höhe).

Wenn Sie Trimble Geomatics Office verwenden, um eine GPS-Kalibrierung durchzuführen, werden die Qualitäten der horizontalen Komponente der Punktposition geändert.

Wenn Sie zuversichtlich sind, daß sich durch die GPS-Kalibrierung die Qualität der Punkte verbessert hat, verwenden Sie das Eigenschaftsfenster, um die Qualität des Basispunkts zu ändern. Die Rover-Punkte von der Basis erhalten dieselbe Qualität wie die Qualität, die Sie dem Basispunkt zuweisen.

HINWEIS: Gemäß Voreinstellung werden die Gitter-Koordinaten für den Punkt deaktiviert, wenn Sie eine GPS-Kalibrierung mit einem RTK-Basisstationspunkt mit WGS-84 Koordinaten durchführen. Sie können jedoch die Gitterpositionen für eine GPS-Kalibrierung verwenden. Wenn Sie dies tun, müssen Sie die Gitter-Koordinate aktivieren (vergewissern Sie sich, daß sie eine bessere Qualität hat, als die WGS-84 Koordinate). Ziehen Sie Punkte nach Datentyp auseinander, und kalibrieren Sie dann erneut. Wenn Sie dies nicht tun, und GPS-Basislinien von Gitterpositionen ausgehen, tritt folgendes Problem auf:

    kein von der Basis abgeleiteter GPS-Punkt kann in der Kalibrierung verwendet werden.

    ein Fehler, der dem Restwertfehler der Kalibrierung entspricht, kann eingeführt werden.

HINWEIS: Wenn Sie eine GPS-Kalibrierung durchgeführt haben und das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung wählen, wird die von Ihnen definierte Kalibrierung ungültig. Eine Warnmeldung informiert Sie, daß die Kalibrierung entfernt wird, wenn Sie fortfahren.

Geoidmodelle verwenden

Wenn das Koordinatensystem für das Projekt die Verwendung eines Geoidmodells zur Bestimmung der Punkthöhen definiert, dann werden Höhen direkt aus den WGS-84-Höhen durch Interpolation auf das Gitter des Geoidmodells erzeugt. Es ist jedoch immer noch möglich, eine Höhenausgleichung zusätzlich zu den aus dem Geoidmodell erzeugten Höhen anzuwenden, um kleine Variationen zu berücksichtigen, die ein Geoidmodell mit großem Maßstab nicht berücksichtigen kann. Wird eine Höhenausgleichung auf örtliche WGS-84-Höhen mit Vermessungsqualität angewendet, ergibt sich daraus eine Höhe mit derselben Qualität.

Regeln für eine gute Kalibrierung

  WGS-84-Koordinaten müssen sich aufeinander beziehen.

Es ist möglich, autonome GPS-Punkte zu erzeugen. Sie sollten jedoch nicht mehr als einen autonomen GPS-Punkt in einer Kalibrierung verwenden. Stellen Sie z. B. sicher, daß nur eine einzige Basisstation mit dem [image] -Softkey im Trimble Survey Controller eingerichtet wurde. Andere Basisstationen sollten auf Positionen eingerichtet werden, die durch GPS-Vektor, bezogen auf die autonome Basisstation, bestimmt wurden. Dies definiert ihre Beziehung zueinander und erlaubt Ihnen, eine Kalibrierung mit Punkten von jeder Basisstation korrekt durchzuführen. Dies ist im folgenden beschrieben:

Die folgende Abbildung zeigt keine Beziehung zwischen den Basisstationen an:

Punkte von Basis 1 und Basis 2 sollten nicht für eine Kalibrierung verwendet werden.

In der folgenden Abbildung ist eine Beziehung zwischen den Basisstationen definiert. Die  zweite Basisstation wird unter Verwendung der ersten Basisstation besetzt:

Punkte von Basis 1 und Basis 2 können für eine Kalibrierung verwendet werden.

  Es sollten die bestmöglichen WGS-84-Koordinaten für die erste Basisstation einer Vermessung verwendet werden.

Die Genauigkeit von GPS-Vektoren (Echtzeit-kinematisch oder nachverarbeitet) wird von der Genauigkeit der Basis-Koordinate beeinflußt. Ein Fehler von bis zu 1 Teil pro Million (1 ppm) kann für jeden 10 m-Fehler in den Basis-Koordinaten eingeführt werden. Wenn z. B. Ihr primärer WGS-84-Referenzpunkt einen Fehler von 100 m hat, und die Basislinie 2 km lang ist, haben Sie einen unnötigen zusätzlichen Fehler von 2 cm in Ihren GPS-Vektoren.


Kalibrierungseinstellungen mit der Registrierung ändern

 Überblick und weitere Informationen

Wenn Trimble Geomatics Office installiert wird, wird eine Registrierungseinstellung (Registry) zur Systemsteuerung Ihres Computers hinzugefügt. Sie enthält:

 die Anzahl der Iterationen, die bei der Berechnung der kleinsten Quadrate für die Kalibrierungsparameter ausgeführt werden

 den maximalen Fehler zwischen den kalibrierten und bekannten Gitternetz-Positionen für die Kalibrierungspunkte

Unter Verwendung der Einträge können Sie steuern, wann eine Warnmeldung erscheint. Die Warnung weist darauf hin, daß die Berechnung das angegebene Kriterium für den maximalen Fehler nicht erfüllt hat.

Einträge in die Registrierung

Die Einträge (Maximaler Fehler und Maximale Anzahl der Iterationen) befinden sich unter dem Registrierungsschlüssel:

HKEY_CURRENT_USER\Software\Trimble\Trimble Geomatics Office\1.6\Calibration

Maximaler Fehler

Verwenden Sie diesen Eintrag, um den maximalen Fehler zu ändern. Der Wert ist der maximale horizontale polare Fehler (Restwert), der zwischen allen berechneten Positionen der Kalibrierungspunkte und der zugeordneten bekannten Gitterposition erlaubt ist.

Wenn dieser festgelegte Fehler überschritten wird, erscheint eine Fehlermeldung, die darauf hinweist, daß die Kalibrierungsberechnung den definierten maximalen horizontalen Restwert überschritten hat.

Die Kalibrierungsresultate können den festgelegten maximalen Fehler in einer der folgenden Situationen überschreiten:

  bei der Eingabe eines Gitter-Festpunktes ist ein Fehler unterlaufen

  einer der Festpunkte wurde bei der Vermessung falsch identifiziert oder nicht bestimmt

  die Kalibrierungsberechnungen konvergieren nicht innerhalb der angegebenen Anzahl von Iterationen

Je kleiner der Wert im Feld Maximaler Fehler ist, desto wahrscheinlicher ist es, daß die Meldung angezeigt wird, daß der maximale Fehler überschritten wurde. Der Grund dafür liegt darin, daß für die Übereinstimmung von berechneten Positionen zu bekannten Positionen engere Kriterien definiert wurden.

Der Voreinstellungswert für dieses Feld (immer in Metern definiert) ist 0,1 m.

Maximale Anzahl Iterationen

Verwenden Sie diesen Eintrag, um die maximale Anzahl der Iterationen zu ändern. Dies bietet Kontrolle über die maximale Anzahl der Iterationen, die bei der Berechnung der Kalibrierungsparameter nach der Methode der kleinsten Quadraten ausgeführt werden. Wenn der Wert auf eine höhere Zahl eingestellt wird, wird bei den Berechnungen eine größere Anzahl von Iterationen durchgeführt, es sei denn, das Programm entdeckt, daß sich die berechneten Parameter nicht mehr bei jeder Iteration ändern.

Der gültige Bereich ist von 5 bis 5000. Wenn Sie einen Wert unter 5 einstellen, wird der Minimalwert 5 verwendet. Wenn Sie einen Wert größer als 5000 einstellen, wird der Maximalwert 5000 verwendet. Die Voreinstellung für Iterationen liegt bei 10.


Befehl GPS-Kalibrierung

Verwenden Sie diesen Befehl, um eine GPS-Kalibrierung durchzuführen.

Wählen Sie hierzu Vermessung / GPS-Kalibrierung.

Das Dialogfeld GPS-Kalibrierung erscheint.

HINWEIS: Wenn Sie Transformationsparameter für die Netzausgleichung definiert haben, bevor das Dialogfeld GPS-Kalibrierung erscheint, werden diese verworfen, wenn Sie eine GPS-Kalibrierung durchführen. Wenn es kombinierte Punkte gleichen Namens gibt, erscheint eine Meldung. Diese Meldung fordert Sie auf, zu bestätigen, daß die Punkte nach Datentyp auseinandergezogen werden sollen.


Dialogfeld GPS-Kalibrierung

 Überblick und weitere Informationen

Verwenden Sie dieses Dialogfeld, um eine GPS-Kalibrierung durchzuführen.

Wählen Sie hierzu Vermessung / GPS-Kalibrierung.

So führen Sie eine GPS-Kalibrierung durch:

1.	Legen Sie fest, welche Kalibrierungskomponenten berechnet werden sollen.

2.	Definieren Sie eine Liste mit Koordinatenpaaren. Ein Paar besteht aus einer abgeleiteten Gitterposition und einer abgeleiteten GPS-Position für denselben Punkt.

3.	Wenden Sie die aktuelle Kalibrierung auf die Datenbank an.

Kalibrierungskomponenten

Die Gruppe Kalibrierungskomponenten enthält die folgenden Kontrollkästchen und Felder:

Datum-Transformation

Normalerweise gibt es eine vordefinierte Datum-Transformation als Teil der Definition des Koordinatensystems. Diese Datum-Transformation kann eine 3- oder 7-Parameter-Transformation sein, eine Definition durch Mehrfachregression oder auf Datum-Gitterdateien basieren (z. B. Nadcon). In diesen Fällen ist es unwahrscheinlich, daß Sie eine unterschiedliche Datum-Transformation berechnen wollen. Lassen Sie deshalb das Kontrollkästchen Datum-Transformation ausgeschaltet. Wenn jedoch keine Informationen zur Datum-Transformation verfügbar sind, oder Sie Grund haben, die verfügbaren Parameter anzuzweifeln, dann berechnen Sie eine Datum-Transformation.

Um eine Datum-Transformation zwischen dem WGS-84-Ellipsoid und dem örtlichen Ellipsoid zu berechnen, das als Teil der Projekt-Koordinatensystemdefinition verwendet wird, schalten Sie dieses Kontrollkästchen ein. Die Optionen Drei-Parameter-Transformation und Sieben-Parameter-Transformation sind verfügbar. Wählen Sie, welche Datum-Transformation berechnet werden soll.

HINWEIS: Diese Option ist nicht verfügbar bei Projekten mit einem Standard-(Transversal-Mercator)-Koordinatensystem, da die Standardprojektion direkt auf dem WGS-84-Ellipsoid basiert. Das bedeutet, daß keine Datum-Transformation erforderlich ist.

Wenn eine Datum-Transformation berechnet wurde und die Kalibrierung auf die Datenbank angewendet wurde, zeigt das Feld Datum im Register Koordinatensystem des Dialogfelds Projekteigenschaften ‘Kalibrierung’ an.

Voreingestellten Projektionsursprung aktualisieren

Diese Option ist nur aktiv, wenn die Definition des aktuellen Koordinatensystems eine Standardprojektion verwendet. Verwenden Sie diese Option, um den Projektionsursprung unter Verwendung des ersten zweidimensionalen Festpunkts in der Punktliste zu aktualisieren. Da die Standardprojektion keinen Breitengrad- und Längengradursprung eines falschen Hoch- und falschen Rechtswerts hat, stellt eine Aktualisierung des Ursprungs sicher, daß der Ursprung des Projekts örtlich ist (d. h. nahe bei den Vermessungsdaten in Ihrem Projekt liegt).

Wenn Sie eine GPS-Kalibrierung in einem Projekt ausführen, für das bereits die Standardprojektion definiert wurde, dann müssen Sie sicherstellen, daß dieses Kontrollkästchen ausgeschaltet ist, damit die Definition der Standardprojektion nicht verändert wird.

Horizontale Ausgleichung

Wählen Sie diese Option, um eine horizontale Ausgleichung zu berechnen. Das Kontrollkästchen Maßstabsfaktor auf 1 setzen wird verfügbar. Wenn Sie keine Strecken skalieren möchten, verwenden Sie diese Option, um den Maßstabsfaktor auf eins zu setzen. Die horizontale Ausgleichung ist eine Ebenen-Transformation. Sie besteht aus Verschiebungen in den Nord/Süd- und Ost/West-Richtungen, einer Rotation um einen definierten Ursprung und einem Maßstabsfaktor. Die Transformationsparameter werden nach der Methode der kleinsten Quadrate berechnet, um die Transformation zu finden, deren Ausgleichungsparameter am besten zu den Festpunkt-Gitterkoordinaten passen, wenn sie auf die GPS-Positionen angewendet werden.

Die horizontale Ausgleichung reduziert alle Restwertfehler zwischen den Festpunktkoordinaten und den aus den GPS-Koordinaten berechneten Gitter-Koordinaten.

TIP: Es ist normalerweise ratsam, eine horizontale Ausgleichung zu berechnen, ohne den Maßstabsfaktor gleich auf 1 zu setzten, um zu überprüfen, ob der berechnete Maßstabsfaktor nahe bei 1 liegt. Wenn der berechnete Maßstabsfaktor nicht nahe bei 1 liegt, dann könnte dies auf ein Problem bei den ausgewählten Kalibrierungspunktepaaren hinweisen.

Vertikale Ausgleichung

Wählen Sie diese Option, um eine vertikale Ausgleichung zu berechnen. Es ist eine Ausgleichung der geneigten Ebene, bestehend aus einer vertikalen Verschiebung an einem definierten Ursprung und Neigungen in den Nord- und Ost-Richtungen. Die Parameter für diese Ausgleichung werden nach der Methode der kleinsten Quadrate berechnet, um eine Ausgleichungsebene zu finden, die die von den GPS-Höhen abgeleiteten Höhen am besten in die Festpunkt-Höhen einpaßt. Dies erfordert drei dreidimensionale Kalibrierungspunktepaare. Mit einem einzigen dreidimensionalen Kalibrierungspunktepaar kann nur der vertikale Verschiebungsparameter berechnet werden. Sind zwei dreidimensionale Kalibrierungspunktepaare verfügbar, definiert das System eine Korrekturebene, die genau diese Paare beinhaltet.

Wenn das Projekt ein Geoidmodell verwendet, wird die vertikale Ausgleichung berechnet und zusätzlich zu den Geoidmodell-Korrekturen angewendet.

Geoidmodell

Das Feld Geoidmodell zeigt den Namen des als Teil der Koordinatensystem-Definition gewählten Geoidmodells an. Wenn es kein Geoidmodell gibt, wird "Keine" angezeigt. Dieses Feld kann nicht bearbeitet werden. Die Einstellungen des Geoidmodells können nur im Register Koordinatensystem des Dialogfelds Projekteigenschaften geändert werden. Wählen Sie hierzu Datei / Projekteigenschaften.

Punktliste

Klicken Sie auf Punktliste, um die Kalibrierungspunktepaare auszuwählen, die für die Kalibrierungsberechnungen verwendet werden sollen. Das Dialogfeld GPS-Kalibrierung wird ausgeblendet, und das Dialogfeld Punktliste erscheint.

Berechnungszusammenfassung

Die Felder in dieser Gruppe zeigen eine Zusammenfassung der zuletzt durchgeführten Kalibrierungsberechnung an. Verwenden Sie die Zusammenfassung, um zu bestätigen, daß die berechnete Kalibrierung gültig ist, ohne daß Sie den Berechnungsbericht ansehen müssen.

Maßstabsfaktor für hz. Ausgleichung

Dieses Feld zeigt den berechneten Maßstabsfaktor für die horizontale Ausgleichung. Wenn Sie das Kontrollkästchen Maßstabsfaktor auf 1 setzen aktiviert haben, zeigt dieses 1 an. Verwenden Sie dieses Feld, um zu bestätigen, daß der berechnete Maßstabsfaktor nahe bei 1 liegt. Ist dies nicht der Fall, weist dies darauf hin, , daß es ein Problem mit einem oder mehreren Kalibrierungspunktepaaren gibt.

Max. vertikale Ausgleichsneigung

Dieses Feld zeigt die maximale Neigung für die berechnete Höhenausgleichung basierend auf den berechneten Gefälle Hoch und Gefälle Rechts-Werten an.

Max. hz. Restwert und Max. vt. Restwert

Diese Felder zeigen die maximalen Restwerte der zuletzt durchgeführten Berechnung an.

OK

Klicken Sie auf OK, um die zuletzt berechnete Kalibrierung auf die Datenbank anzuwenden.

Eine Neuberechnung wird ausgeführt, um sicherzustellen, daß alle GPS-Punkte entsprechend der GPS-Kalibrierung aktualisiert werden. Die Details des Koordinatensystems werden mit den Kalibrierungsparametern aktualisiert.

So können Sie die Kalibrierungsdetails ansehen:

1.	Wählen Sie Datei / Projekteigenschaften.

2.	Wählen Sie das Register Koordinatensystem.

3.	Klicken Sie auf Details.

4.	Wählen Sie das Register Örtl. Anpassung.

Abbrechen

Klicken Sie auf Abbrechen, um das Dialogfeld GPS-Kalibrierung zu verlassen, ohne die berechnete Kalibrierung anzuwenden.

Berechnen

Klicken Sie auf Berechnen, um die Parameter der GPS-Kalibrierung zu berechnen, nachdem Sie alle Einstellungen der Kalibrierungskomponenten geändert haben. Nachdem die Berechnung ausgeführt wurde, werden die Ergebnisse in den Feldern der Gruppe Berechnungszusammenfassung dargestellt.

Speichern als örtl. Anpassung

Klicken Sie auf Speichern, um die aktuelle Kalibrierung und die Koordinatensystemdetails in der Koordinatensystem-Datenbank als Definition einer örtlichen Anpassung zu speichern. Das Dialogfeld Speichern als örtl. Anpassung erscheint. Geben Sie den Namen für die gespeicherte örtliche Anpassungsdefinition ein, und klicken Sie auf OK. Sie können diese örtliche Anpassungsdefinition als Koordinatensystem-Definition für zukünftige Projekte verwenden.

HINWEIS: Es ist nur möglich, eine Koordinatensystem-Definition als örtliche Anpassung zu speichern, wenn das Projekt-Koordinatensystem eine Ebenen-Projektion verwendet oder wenn die Projektion unter Verwendung der Schaltfläche Ändern im Register Koordinatensystem des Dialogfelds Projekteigenschaften gewählt wurde. Diese Schaltfläche ist nicht verfügbar, wenn die Koordinatensystem-Definition nicht als örtliche Anpassung gespeichert werden kann.

Koord.-System

Klicken Sie auf Koord.-System, um die aktuellen Koordinatensystem-Details für das Projekt anzusehen. Dasselbe Dialogfeld erscheint als das Dialogfeld Details im Register Datei / Projekteigenschaften / Koordinatensystem.

Bericht

Klicken Sie auf Bericht, um einen detaillierten Bericht der berechneten Kalibrierung anzusehen. Dieser Bericht zeigt alle berechneten Parameter an sowie einen Vergleich der berechneten Festpunkt-Koordinaten mit deren bekannten Positionen und individuellen Restwerten.


Dialogfeld GPS-Kalibrierung - Punktliste
Dialogfeld GPS-Kalibrierung − Punktliste

Verwenden Sie dieses Dialogfeld, um die Kalibrierungspunktepaare auszuwählen, die Sie verwenden möchten, um die GPS-Kalibrierungsparameter zu berechnen.

So greifen Sie darauf zu:

1.	Wählen Sie Vermessung / GPS-Kalibrierung.

Das Dialogfeld GPS-Kalibrierung erscheint.

2.	Klicken Sie auf Punktliste.

Das Dialogfeld GPS-Kalibrierung − Punktliste erscheint.

Dieses Dialogfeld zeigt eine Scroll-Liste mit Kalibrierungspunktepaar-Gruppen an. Es gibt keine festgelegte Grenze für die Anzahl von Paaren, die zur Berechnung einer Kalibrierung definiert sein können. Das Hinzufügen einer großen Anzahl von Paaren verbessert nicht immer das Resultat der Kalibrierung, aber es bietet eine zusätzliche Überprüfung der Gültigkeit der berechneten Parameter.

Jedes Kalibrierungspunktepaar besteht aus einem GPS-Punkt (ein Punkt mit einer GPS-Position oder ein von einem GPS-Vektor abgeleiteten Punkt) und einem Gitterpunkt (normalerweise ein Festpunkt, ein ausgeglichener Punkt oder ein aus terrestrischen Beobachtungen abgeleiteter Punkt), der kein von GPS abgeleiteter Punkt sein kann.

HINWEIS: Ein GPS-Punkt muß von einem GPS-Vektor stammen, der von einer WGS-84 Koordinate ausgeht. Sie können keinen GPS-Vektor, der von einer Gitter-Koordinate ausgeht, zur Definition eines GPS-Punktes verwenden.

Während Sie Punkte zur Aufnahme in die Punktliste festlegen, prüft das System, ob jeder GPS-Punkt tatsächlich eine GPS-Ableitung hat und kein Gitterpunkt von einem GPS-Punkt abgeleitet wurde.

Die Positionen der Kalibrierungspunktepaare werden im Graphikfenster mit einem Kästchen-Symbol auf dem GPS-Punkt und einem Kreuz-Symbol auf dem Festpunkt hervorgehoben und eine wird angezeigt Linie, die die beiden Positionen verbindet. Sie müssen in eines der Kalibrierungspunktepaare hineinzoomen, um dieses Detail zu sehen. Die Symbole und die Verbindungslinie des aktuellen Kalibrierungspunktepaars in der Punktliste werden mit gestrichelten Linien dargestellt.

Normalerweise wählen Sie die Kalibrierungspunktepaare mit der graphischen Auswahl aus, um die geeigneten Punkte im Graphikfenster zu wählen. Mit der graphischen Auswahl können Sie nur abgeleitete GPS-Punkte als GPS-Punkte und Punkte ohne GPS-Ableitung als Gitterpunkte auswählen. Sie können auch die Namen der Punkte, die Sie verwenden möchten, in die Felder GPS-Punkt und Gitterpunkt eingeben.

Wenn ein GPS-Punkt eine Gitter-Höhe hat, die verwendet wird (und die nicht von der GPS-Höhe und dem Geoidmodell abgeleitet ist), dann können Sie den gleichen Punkt sowohl als GPS-Punkt als auch als Gitterpunkt bei der Berechnung der vertikalen Ausgleichung verwenden.

HINWEIS: Wenn Sie zwei getrennte Punkte (einen GPS-Punkt und einen Gitterpunkt) gleichen Namens haben, wird der Gitterpunkt mit demselben Namen automatisch gewählt, wenn der GPS-Punkt gewählt wird. Wenn die GPS- und Gitter-Koordinaten unter demselben Punkt gespeichert sind, müssen Sie die Punkte nach Typ auseinanderziehen.

Wenn Sie keine geeigneten Gitter-Festpunkte oder GPS-Punkte in der Datenbank haben, dann können Sie geeignete Koordinatenwerte für solche Punkte in die vorgesehenen Felder eingeben. In diesem Fall dürfen Sie keinen Punktnamen für diesen Punkt angeben, da Trimble Geomatics Office einen Punkt mit diesem Namen in der Datenbank erwartet. Positionen, die auf diese Weise eingegeben werden, werden nicht in der Datenbank gespeichert.

So legen Sie Koordinatenwerte (GPS- oder Gitterpunkt) für die Kalibrierung fest:

1.	Klicken Sie auf das Plus (+)-Symbol neben dem GPS-Punkt oder Gitterpunkt in den Namens-Feldern.

Die Baum-Ansicht wird geöffnet, um die Koordinatenfelder anzuzeigen.

2.	Verwenden Sie die graphische Auswahl, oder geben Sie einen Wert mit der Tastatur ein, um die Koordinatenfelder zu vervollständigen.

Wenn Sie keinen GPS-Punkt zur Verwendung in einer GPS-Kalibrierung auswählen können, siehe Probleme beim Auswählen von Punkten für eine GPS-Kalibrierung.

Typ

Verwenden Sie dieses Feld, um anzugeben, wie ein Kalibrierungspunktepaar bei der Berechnung der Kalibrierung verwendet werden soll. Trimble Geomatics Office füllt die Felder automatisch mit dem geeigneten Typ aus, wenn Sie ein Koordinatenpaar ausgewählt hatten. Wenn Sie den Typ ändern, stellen Sie sicher, daß die gewählte Option zulässig ist. Beispiel: Wenn der Festpunkt keine Höhe hat, können Sie das Feld Typ nicht auf Horz und Vert einstellen.

Die verfügbaren Optionen sind:

 Horz und Vert −  gibt an, daß das Kalibrierungspunktepaar sowohl für die Bestimmung horizontaler als auch vertikaler Ausgleichungen verwendet werden kann.

  Horizontal − gibt an, daß das Kalibrierungspunktepaar nur für die Bestimmung einer horizontalen Ausgleichung verwendet werden kann. Dies bedeutet, daß der Höhenwert für den Gitterpunkt nicht verläßlich ist.

  Vertikal −  gibt an, daß das Kalibrierungspunktepaar nur für die Bestimmung einer vertikalen Ausgleichung verwendet werden kann. Das bedeutet, daß die Werte für Rechtswert und Hochwert für den Gitterpunkt nicht verläßlich sind.

  (Ignoriert) − gibt an, daß das Kalibrierungspunktepaar nicht für die Berechnung von Transformationsparametern verwendet werden darf. Dies ist eine sinnvolle Option, wenn Sie ein Problem in der Berechnung Ihrer Kalibrierung gefunden haben und versuchen, das verdächtige Kalibrierungspunktepaar zu lokalisieren. Sie können diese Einstellung verwenden, um ein Kalibrierungspunktepaar zeitweise aus der Berechnung zu entfernen, um zu sehen, ob sich die Ergebnisse verbessern.

  (Ungültig) − gibt an, daß das ausgewählte Punktepaar ein ungültiges Punktepaar ist.

Statistik

Die Felder in dieser Gruppe enthalten die Kalibrierungsergebnisse basierend auf den Werten, die Sie zur Punktliste hinzugefügt haben. Verwenden Sie die Zusammenfassung, um die Kalibrierungsstatistik zu prüfen und schlechte Punktepaare zu identifizieren, bevor Sie die Punktliste akzeptieren.

Maßstabsfaktor für hz. Ausgleichung

Das Feld Maßstabsfaktor für hz. Ausgleichung enthält den berechneten Maßstabsfaktor für die horizontale Ausgleichung. Wenn Sie das Kontrollkästchen Maßstabsfaktor auf 1 setzen gewählt haben, wird in diesem Feld “Eins” angezeigt. Verwenden Sie dieses Feld, um zu prüfen, ob der Maßstabsfaktor nahe bei 1 liegt. Ist dies nicht der Fall, ist ein Problem mit einem oder mehreren Kalibrierungspunktpaaren aufgetreten.

Max vertikale Ausgleichungsneigung

Das Feld Max vertikale Ausgleichungsneigung enthält die maximale Neigung für die berechnete Höhenausgleichung, basierend auf den berechneten Werten für die Felder Gefälle Hoch und Gefälle Rechts.

Max. hz. Restwert und Max. vt. Restwert

Die Felder Max. hz. Restwert und Max. vt. Restwert enthalten die maximalen Restwerte.

Einfügen

Klicken Sie auf Einfügen, um einen leeren Kalibrierungspunktepaar-Datensatz einzufügen. Dies ist sinnvoll, wenn Sie die Standardprojektion verwenden und den Ursprung der Projektion aktualisieren möchten. Das erste Punktepaar wird verwendet, um den Ursprung zu aktualisieren. Verwenden Sie deshalb diese Schaltfläche, um ein neues leeres Kalibrierungspunktepaar am Anfang der Liste einzufügen.

Löschen

Klicken Sie auf Löschen, um ein Kalibrierungspunktepaar aus der Liste zu entfernen.


Probleme beim Auswählen von Punkten für eine GPS-Kalibrierung

Wenn Sie das Dialogfeld GPS-Kalibrierung − Punktliste verwenden, um Punkte für eine GPS-Kalibrierung auszuwählen, und Sie im System keinen GPS- oder Gitter-Punkt für das Kalibrierungspunktepaar auswählen können, hat dies einen der folgenden Gründe:

Der Von-Punkt ist von einem Gitternetz abgeleitet.

Der Punkt ist das Ergebnis eines Vektors, wobei der ‘Von-Punkt’ des Vektors von einer Gitterposition abgeleitet wurde. Dies kann passieren, wenn Sie eine Gitterposition als Basisstation nach einer Echtzeit-kinematischen (RTK)-Vermessung eingegeben haben. Eine WGS-84-Position wird für die Basis unter Verwendung der Gitterposition berechnet. Alle Vektoren, die von der Basisstation ausgehen, werden angewendet. Die Position der einzelnen Punkte ist allerdings aus einer Kombination von WGS-84-Werten (dem Vektor) und Gitter-Werten (der Basis-WGS-84-Position) abgeleitet. Sie können keine Punkte verwenden, die Vektoren haben, die von der Basis angewendet wurden. Dies wird in den folgenden Abbildungen dargestellt:

  Punkt 1 kann nicht als GPS-Punkt in einer GPS-Kalibrierung verwendet werden.

Die Basis-Gitterposition wird in WGS-84 konvertiert und dann der Vektor angewendet, um Punkt 1 zu positionieren.

  Punkt 1 kann als GPS-Punkt in einer GPS-Kalibrierung verwendet werden.

Der Vektor wird auf die Basis-WGS-84-Position angewendet, um die Position von Punkt 1 zu bestimmen.

Verwenden Sie das Eigenschaftsfenster, um dies zu beheben, die Koordinaten des Punkts zu bearbeiten und eine WGS-84-Position einzugeben. Diese hat Vorrang vor der Gitterposition; alle Vektoren, die von der Basisstation ausgehen, werden als GPS-Punkte in einer GPS-Kalibrierung verfügbar.

Wenn der "Von"-Punkt aus einer Gitterposition abgeleitet wurde, kann der GPS-Punkt nicht gewählt werden. Dies gilt ebenfalls für Gitterpunkte, die aus GPS-Beobachtungen abgeleitet wurden. Ein Gitter-Punkt muß von einer terrestrischen Beobachtung ausgehen.


Drei-Parameter-Transformation

Verwenden Sie eine GPS-Kalibrierung, um eine Datum-Transformation zu definieren, wenn Sie kein definiertes Koordinatensystem haben und Ihre eigenen Parameter für die Datum-Transformation in Ihrem Projektgebiet erzeugen möchten.

Der Algorithmus für die Drei-Parameter-Transformation berechnet Verschiebungswerte entlang der kartesischen X-, Y- und Z-Achsen vom Mittelpunkt des WGS-84-Ellipsoids zum Mittelpunkt des Ellipsoids für die örtliche Projektion. Die Festpunktpositionen werden verwendet, um die räumliche Positionierung des örtlichen Ellipsoids und damit seinen Bezug zum WGS-84-Ellipsoid zu bestimmen.


Sieben-Parameter-Transformation

Verwenden Sie eine GPS-Kalibrierung, um eine Datum-Transformation zu definieren, wenn Sie kein definiertes Koordinatensystem haben und Ihre eigenen Parameter für Datum-Transformation in Ihrem Projektgebiet erzeugen möchten.

Der Algorithmus für die Sieben-Parameter-Transformation berechnet drei Verschiebungswerte, drei Rotationswerte und eine Maßstabsänderung zwischen dem WGS-84-Ellipsoid und dem Ellipsoid für die örtliche Projektion. Die drei Verschiebungswerte werden entlang der kartesischen X-, Y- und Z-Achsen vom Mittelpunkt des WGS-84-Ellipsoids zum Mittelpunkt des Ellipsoids für die örtliche Projektion berechnet, wie bei der Drei-Parameter-Transformation. Es werden Rotationen um jede Achse zwischen den beiden Ellipsoiden berechnet und ein Maßstabsfaktor, der mögliche Größenunterschiede zwischen den Ellipsoiden berücksichtigt (hervorgerufen durch verschieden große Halbachsen und Abplattungswerte).

Die Festpunktpositionen werden verwendet, um die räumliche Positionierung des örtlichen Ellipsoids und damit seinen Bezug zum WGS-84-Ellipsoid zu bestimmen. Es gibt enge Beziehungen zwischen der berechneten Verschiebung und den Rotationswerten (d. h. das Resultat einer sehr kleinen Rotation, die auf einen großen Radius wie den Erdradius angewendet wird, ist einer Verschiebung sehr ähnlich). Dies bedeutet, daß Sie große berechnete Kompensationswerte erhalten können, wenn die Festpunkte nicht ein ausreichend großes Gebiet abdecken. Normalerweise sollte eine Sieben-Parameter-Transformation nicht berechnet werden, wenn die Festpunkte nicht ein Gebiet von ungefähr 80 km x 80 km abdecken. Zusätzlich sollten die berechneten Werte für die Rotation nicht 10° eines Bogens überschreiten.


GPS-Beobachtungen - Überblick
GPS-Beobachtungen − Überblick

 Überblick und weitere Informationen

Eine GPS-Beobachtung oder Basislinie ist ein Vektor zwischen zwei mit GPS beobachteten Punkten. Die beiden Punkte, die verwendet werden, um eine Basislinie zu bestimmen, hängen von der verwendeten Vermessungstechnik ab. Beispiel: In einer Echtzeit-kinematischen Vermessung (RTK) oder einer nachverarbeiteten kinematischen Vermessung (NVK) besteht eine Basislinie von der Basisstation zu jedem Rover-Punkt.

Dagegen gibt es bei statischen und FastStatic-Vermessungen keine Basisstation. Bei diesen Vermessungstechniken besteht eine GPS-Basislinie zwischen Punkten, die zur gleichen Zeit besetzt waren, wie in der folgenden Tabelle dargestellt:

Wenn Sie den Basislinientyp ansehen möchten, wählen Sie ihn, und öffnen Sie das Eigenschaftsfenster.

Statische, FastStatic- und Nachverarbeitete Kinematische (NVK)-Basislinien

Static, FastStatic- und NVK-Beobachtungen, die noch nicht nachverarbeitet wurden, sind  nicht verarbeitete Basislinien. Wenn die Basislinien nachverarbeitet wurden, werden Sie zu nachverarbeiteten Basislinien.

Wenn Sie eine nachverarbeitete Basislinie löschen, wird die Basislinie wieder zu einer potentiellen Basislinie. Sie können die Basislinie durch Löschen des Punkts entfernen. Alternativ hierzu deaktivieren Sie die Basislinie, wenn Sie nicht möchten, daß sie in weiteren Vermessungsberechnungen verwendet werden soll, Sie die Punkte aber weiterhin beibehalten möchten.

NVK-kontinuierliche Basislinien

Wenn NVK-kontinuierliche Basislinien nachverarbeitet wurden, werden sie in der gleichen Farbe wie NVK-Basislinien dargestellt, aber im Eigenschaftsfenster wird ‘Kontinuierlich’ als Feldmethode angezeigt.

RTK-Basislinien

RTK-Basislinien können keine potentiellen Basislinien sein, Sie werden als ‘RTK-Basislinien’ im Eigenschaftsfenster dargestellt. Kontinuierliche RTK-Basislinien werden in der gleichen Farbe wie RTK-Basislinien dargestellt, aber im Eigenschaftsfenster wird ‘Kontinuierlich’ als Feldmethode angezeigt.

Als Prüfpunkt aktivierte Basislinien

Wenn der Status der Basislinie auf ‘Als Prüfpunkt aktivieren’ eingestellt ist, wird die Basislinie mit gestrichelten Linien dargestellt.

Deaktivierte Vektoren

Wenn der Status der Basislinie auf ‘Deaktiviert’ eingestellt ist, wird die Basislinie in der entsprechenden Farbe für deaktivierte Basislinien dargestellt.


GPS-Besetzungen

Jedesmal, wenn ein Punkt mit GPS beobachtet wird, wird ein GPS-Besetzungsdatensatz erzeugt.

Verwenden Sie das Eigenschaftsfenster, um GPS-Besetzungsdatensätze anzusehen:

1.	Wählen Sie eines der folgenden:

  ein mit GPS beobachteter Punkt

  die Basislinie (in der Vermessungsansicht)

2.	Klicken Sie auf die Schaltfläche [image], um den GPS-Besetzungsdatensatz anzusehen.

Wenn Sie einen mit GPS beobachteten Punkt im Eigenschaftsfenster auswählen, können Sie alle GPS-Besetzungsdatensätze für diesen Punkt ansehen. Wenn Sie eine Basislinie im Eigenschaftsfenster auswählen, können Sie die GPS-Besetzung der Basislinie ansehen..

Die GPS-Besetzungsdatensätze enthalten:

  Punktnamen

  Dauer und Startzeit der Besetzung

  GPS-Antennendetails einschließlich Antennenhöhe, -typ und Methode.

Beim Datenimport werden die Start- und Endzeiten von der GPS-Zeit zur UTC (Universal Time Coordinated −  effektive mittlere Greenwich-Zeit) konvertiert. Die Zeiten werden dann als Ortszeiten unter Verwendung der aktuellen Zeitzone dargestellt, die in Microsoft Windows festgelegt wurde.


Prismen-Konstante

Die Prismenkonstante ist eine Korrektur an der mit einer Totalstation gemessenen Schrägstrecke, die während der Neuberechnung durchgeführt wird. Sie ist notwendig, weil sich die Fläche des Prismenreflektors nicht direkt über dem gemessenen Vermessungspunkt befindet. Die Konstante ist normalerweise ein negativer Wert.

wobei:

	die korrigierte Schrägstrecke
	die gemessene Schrägstrecke
	die Prismen-Konstante ist

Der Wert der Prismen-Konstante wird in den Zielpunktinformationen gespeichert.

So können Sie den Wert einer Prismen-Konstante ansehen und bearbeiten:

1.	Wählen Sie einen Zielpunkt oder eine konventionelle Vermessung.

Öffnen Sie das Eigenschaftsfenster.

3.	Klicken Sie auf die Schaltfläche

HINWEIS: in der 3300/3600/5600 Elta- und der 3600/5600 GDM-Software wird die Prismen-Konstante im Instrument angewendet, aber nicht in der Datei gespeichert. Die Prismen-Konstante wird als ‘?’ angezeigt.

Wenn am Instrument eine falsche Prismen-Konstante eingestellt wurde, und Sie diesen Wert in Trimble Geomatics Office korrigieren möchten, geben Sie im Feld Prismenkonstante des Eigenschaftsfensters die Differenz zwischen der falschen und der richtigen Prismen-Konstante ein. Wie Sie z. B. eine Prismen-Konstante von “20” eingegeben haben, und die tatsächliche Prismen-Konstante “5” beträgt, müssen Sie “–15” eingeben.

TIP: Sie können das Dialogfeld Mehrfachbearbeitung verwenden, um mehrere Beobachtungen zu bearbeiten.


Korrekturen der EDM-Montageexzentrizität (EDM= Elektronische Streckenmeßausrüstung)

Bei den meisten modernen Totalstationen ist keine Korrektur der Montageexzentrizität erforderlich, da die Meßlinie der elektronischen Streckenmessung (EDM) mit der Sichtlinie des Teleskops übereinstimmt. Diese Korrektur ist nicht erforderlich, wenn ein EDM mit montiertem Teleskop und einem kippbaren Reflektor verwendet wird, wobei Reflektor/Ziel so ausgelegt sind, daß sie mit dem EDM/Fernrohr-Aufbau übereinstimmen.

Es kann jedoch in manchen Fällen notwendig sein, eine Korrektur für die gemessene Schrägstrecke zu berechnen, um die Schrägstrecke zu finden, die Sie vermessen hätten, wenn die EDM-Meßlinie mit der Sichtlinie des Teleskops übereingestimmt hätte. Die Korrektur der Montageexzentrizität hängt vom Typ des Montagesystems ab und wird von Trimble Geomatics Office automatisch unter Verwendung der entsprechenden, nachstehend aufgeführten Formeln angewendet.

Die geeigneten Offset-Werte werden im Instrumenten-Datensatz in der Geräte-Datei gespeichert.

1. Standard-montiertes EDM mit nicht kippbarem Reflektor.

wobei:

	die korrigierte Schrägstrecke
	das EDM-Offset (beim Instrument)
	das Reflektor-Offset (beim Ziel)
	der beobachtete vertikale Winkel des Zenits
	die gemessene Schrägstrecke (nach Anwendung der Prismen-Konstante) ist

2. Teleskop-montiertes EDM mit nicht kippbarem Reflektor.

wobei:

	die korrigierte Schrägstrecke
	das EDM-Offset (beim Instrument)
	das Reflektor-Offset (beim Ziel)
	der beobachtete vertikale Winkel des Zenits
	die gemessene Schrägstrecke ist
Diese Korrektur wird beim Importieren einer Geräte-Datei angewendet.


Druck- und Temperaturkorrektur

Druck- und Temperaturkorrekturen werden durchgeführt, um durch Druck und Temperatur hervorgerufene Abweichungen der gemessenen Längen zu korrigieren. Sie können die entsprechenden Werte während der Arbeit im Feld eingeben oder die Geräte-Datei vor dem Importieren bearbeiten.

Die mit EDMs durchgeführten elektronischen Streckenmessungen basieren auf der Lichtgeschwindigkeit in der Luft. Temperatur und Druck beeinflussen diese Geschwindigkeit.

Diese atmosphärische Korrektur wird nur auf Streckenmessungen angewendet, wenn das EDM nicht bereits eine geeignete Korrektur angewendet hat.

wobei:

	die korrigierte Schrägstrecke
	die gemessene Schrägstrecke
	der voreingestellte gruppenrefraktive Index für die Träger- und Modulationsfrequenzen des EDM-Instruments
	die Konstante für die Trägerwellenlänge (mm Hg) des EDM-Instruments
	der atmosphärische Druck in mm Quecksilber
	die Trockentemperatur in Grad Celsius ist
HINWEIS: Trimble empfiehlt, den Druck und die Temperatur im Trimble Survey Controller aufzuzeichnen. Diese Korrektur wird beim Importieren der Datei auf die Schrägstrecke(n) angewendet.

HINWEIS: In der 3600/5600 Zeiss Elta-, 3600/5600 GDM- und TDS Survey Pro-Software werden Druck- und Temperaturkorrekturen im Instrument angewendet, daher sind die Beobachtungen bereits korrigiert, wenn sie in Trimble Geomatics Office importiert werden.


Vertikale Kollimation

Die Korrektur durch vertikale Kollimation ist eine Winkelkorrektur, die direkt auf den vertikalen Winkel angewendet wird.

Die vertikale Kollimation eines Instruments wird durch sorgfältige Beobachtung eines Objekts in beiden Instrumentenlagen bestimmt. Der erzielte Korrekturwert zeigt einen konstanten Fehler an, hervorgerufen durch geringe Ungenauigkeiten beim Positionieren des Fadenkreuzes im Teleskop.

Wenn der Kollimationsfehler in einem Instrument bestimmt wurde, wird ein Kollimations-Datensatz in der Geräte-Datei gespeichert und die vertikale Kollimation auf alle folgenden vertikalen Winkel angewendet:

Lage 1:
Lage  2:
 wobei:

	der korrigierte vertikale Winkel
	der beobachtete vertikale Winkel (Zenitwinkel)
	die vertikale Kollimationskorrektur ist.   diese Korrektur wird beim Importieren einer Geräte-Datei angewendet.
HINWEIS: Trimble Survey Controller hat kein Kollimationsprogramm. Beim Importieren wird keine Kollimationskorrektur durchgeführt.

HINWEIS: In der 3300/3600/5600 Elta-, 3600/5600 GDM- und TDS Survey Pro-Software wird die vertikale Kollimation angewendet, bevor Daten in Trimble Geomatics Office importiert werden.


Krümmung und Refraktion

Die Krümmungs- und Refraktionskorrektur wird auf vertikale Winkel angewendet, um den Effekt der Erdkrümmung und der atmosphärischen vertikalen Brechung des Lichts zu berücksichtigen.

wobei:

	der korrigierte vertikale Zenitwinkel
	der beobachtete vertikale Zenitwinkel
	die korrigierte Schrägstrecke
	der Koeffizient der Refraktion – normalerweise 0,142 oder 0,20, abhängig vom Wert im Projekt-Datensatz in der Geräte-Datei
	der Erdradius ist
HINWEISE:

  Dieses Format gibt einen Wert im Bogenmaß aus.

  Die Krümmungs- und Refraktionskorrektur wird beim Importieren einer Trimble Survey Controller-Datei angewendet.

  In der 3300/3600/5600 Elta-Software werden Krümmungs- und Refraktionskorrekturen im Instrument angewendet. Die Beobachtungen sind daher bereits korrigiert, wenn sie in Trimble Geomatics Office importiert werden.

  In der 3600/5600 GDM-Software werden Krümmungs- und Refraktionskorrekturen auf berechnete Koordinaten angewendet. Rohbeobachtungen werden in Trimble Geomatics Office importiert und korrigiert.

  In der TDS Survey Pro-Software werden Krümmungs- und Refraktionskorrekturen beim Importieren der Daten in Trimble Geomatics Office angewendet.


Horizontale Kollimation

HINWEIS: Trimble Survey Controller hat kein Kollimationsprogramm. Beim Importieren wird keine Kollimationskorrektur durchgeführt.

Wenn ein Kollimations-Datensatz gefunden wird, wendet Trimble Geomatics Office die horizontale Kollimation gemäß der folgenden Formel an:

Lage 1:
Lage 2:

wobei:

	der korrigierte horizontale Winkel
	der beobachtete horizontale Winkel
	die horizontale Kollimationskorrektur ist

Diese Kollimationskorrektur wird, falls erforderlich, beim Importieren einer Geräte-Datei angewendet.

HINWEIS: In der 3300/3600/5600 Elta-, 3600/5600 GDM- und TDS Survey Pro-Software wird die horizontale Kollimation vor dem Importieren der Daten in Trimble Geomatics Office angewendet.


Horizontale Orientierung

 Siehe auch

Terrestrische horizontale Winkel werden bei der Neuberechnung unter Verwendung des Rückblicks orientiert. Der horizontale Winkel wird zum Azimut hinzugefügt, und das Ergebnis ist der Azimut zum Vorblick-Punkt. Dadurch erhalten alle Beobachtungen am Standpunkt eine Orientierung.

Der Azimut zum Rückblick-Punkt wird unter Verwendung folgender Regeln berechnet (nur konventionelle Beobachtungen):

  Wenn nur die Positionen des Instrumentenpunkts und des Rückblick-Punkts bekannt sind (kein Azimut eingegeben wurde), wird bei der Neuberechnung der Rückblick-Azimut, der aus Richtungswinkel/Strecke zwischen den beiden Punkten bestimmt wurde, verwendet.

  Wenn nur ein eingegebener Azimut zur Verfügung steht, und der "Zu"-Punkt keine Koordinate hat, wird dieser als Rückblick-Azimut bei der Neuberechnung verwendet.

  Wenn beide Positionen (die des Instrumenten- und des Rückblick-Punkts) bekannt sind, und ein eingegebener Azimut zur Verfügung steht, wird die Qualität jedes Azimuts bei der Neuberechnung bestimmt; die Qualitätshierarchie in nachstehender Tabelle wird verwendet, um festzulegen, welcher Azimut als Rückblick-Azimut benutzt werden soll.

Wenn z. B. ein Instrumenten- und Rückblickpunktepaar mit Vermessungsgüte sowie ein eingegebener Azimut mit Festpunktgüte existieren, wird der eingegebene Azimut als Rückblick-Azimut verwendet.

HINWEIS: Zur Berechnung des Rückblick-Azimuts wird die horizontale Qualität des Instrumentenpunkts und des Rückblick-Punkts geprüft, und der Punkt mit der geringeren Qualität verwendet. Wenn der Instrumentenpunkt z. B. Festpunktgüte und der Rückblick-Punkt Kartographiegüte hat, wird dem Rückblick-Azimut Kartographiegüte zugewiesen.

Typ	Qualität
Aus Koordinaten abgeleitet	Festpunkt
Eingegebener Azimut	Festpunkt
Aus Koordinaten abgeleitet	Vermessung
Eingegebener Azimut	Vermessung
Aus Koordinaten abgeleitet	Kartographie
Eingegebener Azimut	Kartographie
HINWEIS: Wenn Sie möchten, daß bei der Neuberechnung der eingegebene Azimut anstelle des Azimuts zwischen dem Instrumenten- und dem Rückblick-Punkt verwendet wird, erhöhen Sie die Qualität der eingegebenen Azimut-Position. Sie muß in der Qualitätshierarchie eine besser Qualität haben als der Azimut, der zwischen dem Instrumenten- und dem Rückblick-Punkt berechnet wurde.

TIP: Sie können die Qualität eines eingegebenen Azimuts bearbeiten.


Horizontale Winkel

 Siehe auch

Bei terrestrischen Beobachtungen speichert Trimble Geomatics Office keine orientierten horizontalen Winkel zwischen den Punkten. Die Winkel werden durch eine Neuberechnung orientiert.

Beim Importieren wird der horizontale Winkel bestimmt durch:

wobei:

	der in Trimble Geomatics Office gespeicherte horizontale Winkel
	die horizontale Beobachtung zum Vorblick-Punkt
	die horizontale Beobachtung zum Rückblick-Punkt ist
Der BSObs-Wert wird im BKB-Datensatz in der Geräte-Datei gespeichert. (Der BKB- Datensatz ist ein Datensatztyp, der in einer Datei des Rückblick-Datensatzes enthalten ist).

Wenn es keinen Rückblick-Datensatz gibt, behandelt Trimble Geomatics Office den ersten beobachteten Punkt als Rückblick-Punkt.


Schrägstrecken-Reduktion

 Überblick

Bei jeder terrestrischen Beobachtung reduziert Trimble Geomatics Office die Schrägstrecke bei der Neuberechnung auf ihre horizontalen und vertikalen Komponenten.

Die folgenden beiden Formeln werden verwendet:

wobei:

	die horizontale Strecke an der Höhe des Quellpunkts
	der ellipsoidische Höhenunterschied zwischen Quell- und Zielpunkt
	die Schrägstrecke (nach Beobachtungskorrekturen)
	der vertikale Winkel (Zenit) ist
Siehe das Reduktionsdiagramm. Das Diagramm erklärt die in den beiden obigen Formeln verwendeten Werte.


Meereshöhen-Korrektur

Die Korrektur auf Meereshöhe (oder Ellipsoidebenen-Korrektur) wird auf die berechnete horizontale Strecke angewendet. Wählen Sie Datei / Projekteigenschaften / Register Neu berechnen, um festzustellen, ob Meereshöhen-Korrekturen angewendet wurden

Diese Korrektur reduziert eine horizontale Strecke auf die Strecke, die auf der Ellipsoidebene gemessen worden wäre (nicht auf Geoidebene, das ist Meereshöhe). Diese Differenz ist bei der Reduktion nicht erheblich.

Wenn das Kontrollkästchen Terrestrische Beobachtungen auf Ellipsoid reduzieren (NN-Korrektur) aktiviert ist, werden terrestrische Beobachtungen entlang des örtlichen Ellipsoids angewendet. Wenn das Kontrollkästchen Terrestrische Beobachtungen auf Ellipsoid reduzieren (NN-Korrektur) deaktiviert ist, werden terrestrische Beobachtungen am Boden angewendet.

Die Formel für die Ellipsoidebenen-Korrektur ist:

wobei:

	Der Erdradius ist
Siehe das Reduktionsdiagramm. Das Diagramm erklärt die in der obigen Formel verwendeten Werte.

HINWEIS: Die Ellipsoidebenen-Korrektur wird nicht in einem Nur-Maßstab-Projekt angewendet. Wenn Sie eine Nur-Maßstab-Datei importieren, ist die Ellipsoidebenen-Korrektur in Trimble Geomatics Office automatisch deaktiviert. Sie ist nur aktiviert, wenn Sie das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung aktivieren.


Erdradius

In Trimble Geomatics Office wird der Erdradius unter Verwendung des Projekt-Breitengrads und des Projekt-Ellipsoids berechnet. Wenn kein Breitengrad für das Projekt definiert wurde, wird ein voreingestellter Projekt-Breitengrad von 30 Grad verwendet. Der Wert für den Erdradius auf dem WGS-84 Ellipsoid beträgt z. B. 6383 480.917 bei einem Projekt-Breitengrad von 30 Grad.

HINWEIS: Definieren Sie den Breitengrad des Projekts, bevor Sie terrestrische Beobachtungen importieren. Wenn Sie den Projekt-Breitengrad nach dem Importieren der terrestrischen Daten definieren, werden die Ellipsoidkorrektur und die Krümmungs- und Refraktionskorrekturen nicht erneut unter Verwendung des neu berechneten Erdradius angewendet.

So definieren Sie den Breitengrad des Projekts:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Koordinatensystem.

3.	Klicken Sie in der Gruppe Einstellungen örtliche Anpassung auf Ändern.

4.	Geben Sie den Breitengrad des Projekts in die Gruppe Projektstandort ein.


Konventionelle Beobachtungen - Überblick
Konventionelle Beobachtungen − Überblick

Trimble Geomatics Office unterstützt Punkte, die mit konventionellen Vermessungsinstrumenten beobachtet wurden. Diese Punkte werden als konventionelle Beobachtungen bezeichnet.

In Trimble Geomatics Office können Sie:

  konventionelle Beobachtungen importieren

  Laser-Entfernungsmesser-Beobachtungen importieren

  Digitale Nivellier-Dateien importieren


Reduktion von konventionellen Beobachtungen

Die Neuberechnungsfunktion in Trimble Geomatics Office verwendet die Streckenmessungen und beobachteten Winkel, um Koordinaten für konventionell beobachtete Punkte zu berechnen.

Importieren

Beim Importieren werden folgende Korrekturen angewendet:

  Druck- und Temperaturkorrektur, angewendet auf die Schrägstrecke.

  Krümmung und Refraktion, angewendet auf den vertikalen Winkel.

  Horizontaler Winkel, reduziert horizontale Beobachtungen auf horizontale Winkel vom Rückblick-Punkt. Ablesungen in zweiter Lage werden als Ablesungen in erster Lage gespeichert.

  Korrekturen für elektronische Streckeneinrichtungen (EDM) Montageexzentrizität.

  Vertikale Kollimation.

  Horizontale Kollimation.

Neuberechnung

Bei der Neuberechnung werden folgende Korrekturen angewendet:

  Korrektur auf Meereshöhe

  Horizontale Orientierung

  Prismen-Konstante


Reduktionsdiagramm

Das folgende Diagramm erklärt die in den Korrektur-Formeln verwendeten Werte:

wobei:

	der vertikale Winkel (Zenit)
	die Schrägstrecke (nach Beobachtungskorrekturen)
	die Höhe des Quellpunkts über dem Ellipsoid
	der ellipsoidische Höhenunterschied zwischen Quell- und Zielpunkt
	die horizontale Strecke an der Höhe des Quellpunkts
	die Meereshöhen-Sehne (oder Ellipsoidebenen-Sehne)
	die Mehreshöhen-Strecke (Ellipsoid-Strecke) ist


Konventionelle Beobachtungen - Beobachtungen in zweiter Lage
Konventionelle Beobachtungen – Beobachtungen in zweiter Lage

Beobachtungen in 2. Lage werden konvertiert und in der Datenbank als Beobachtungen erster Lage gespeichert. Verwenden Sie das Eigenschaftsfenster, um eine Beobachtung zu wählen. Die Lage (L1 oder L2) wird angezeigt.

Wenn Beobachtungen in 1. und 2. Lage vorhanden sind, die zu und von denselben Punkten durchgeführt wurden, werden die Beobachtungen in 1. und 2. Lage gemittelt. Dieser Wert wird als Beobachtungsmittel importiert. Der Beobachtungstyp wird als gemittelt angegeben.


Konventionelle Beobachtungen - Polygonzug
Konventionelle Beobachtungen − Polygonzug

Mit Trimble Survey Controller, TDS Survey Pro oder mit der 3600/5600 Elta-Software können Sie Polygonzug-Abschlußfehler für Ihre konventionellen Beobachtungen berechnen und den Polygonzug ausgleichen.

Gehen Sie folgendermaßen vor, wenn Sie einen Polygonzug ausgeglichen haben und die ausgeglichenen Werte dann ändern möchten:

1.	Wählen Sie den Punkt aus, dessen Koordinaten Sie ändern möchten.

2.	Öffnen Sie das Eigenschaftsfenster, und expandieren Sie den Punkt in der Baumstruktur.

3.	Prüfen Sie, ob bereits Gitter-/örtliche Koordinaten für den Punkt vorhanden sind. Falls nicht, fügen Sie eine Koordinate unter Verwendung des Symbols Koordinate hinzufügen [image] hinzu.

4.	Klicken Sie in die Koordinatenfelder, und geben Sie die bekannten Koordinatenwerte ein.

5.	Wählen Sie in den Qualitätsauswahlfeldern neben den Koordinatenfeldern die Qualität aus der Dropdown-Liste. Die Qualität muß Vermessungsgüte oder höher sein, damit die Koordinatenwerte Vorrang vor den Beobachtungen haben.

6.	Klicken Sie auf OK.

7.	Drücken Sie F4, um eine Neuberechnung der Vermessungsdaten auszuführen.

Bei der Neuberechnung werden alle Abschlußfehler zwischen den bekannten und den beobachteten Koordinaten bestimmt.

Die Abschlußfehler werden im Neuberechnungsbericht angezeigt. Wenn Sie diese Abschlußfehler nicht ansehen möchten, dann deaktivieren Sie die Beobachtung.

Führen Sie einen der folgenden Schritte aus, um Abschlußfehler anzusehen:

  Wählen Sie Berichte / Bericht Neuberechnung.

  Klicken Sie auf die Seite Schaltfläche Warnung [image] im Eigenschaftsfenster, und wählen Sie das Punktableitungssymbol [image].

  Klicken Sie auf die Schaltfläche Zusammenfassung [image] im Eigenschaftsfenster, und wählen Sie das Punktableitungssymbol [image].


Laser-Entfernungsmesser-Beobachtungen - Überblick
Laser-Entfernungsmesser-Beobachtungen − Überblick

Trimble Geomatics Office unterstützt Punkte, die mit Laser-Entfernungsmessern mit der Trimble Survey Controller-Version 7.00 oder höher beobachtet wurden. Informationen darüber, welche Laser-Entfernungsmesser von Trimble Survey Controller unterstützt werden, finden Sie im Trimble Survey Controller-Referenzhandbuch.

Wie Laser-Entfernungsmesser-Beobachtungen angezeigt werden, hängt von den Anzeige-Einstellungen im Eigenschaftsfenster ab.

In Trimble Geomatics Office können Sie:

  Survey Controller-Dateien (*.dc) mit Laser-Entfernungsmesser-Beobachtungen importieren. (Beobachtete Laser-Entfernungsmesser-Punkte werden genau wie konventionelle Punkte in Trimble Geomatics Office importiert).

  Laser-Entfernungsmesser-Beobachtungen ansehen im Eigenschaftsfenster.

  Laser-Entfernungsmesser-Beobachtungen wählen und darüber berichten.


Laser-Entfernungsmesser-Beobachtungen - Anzeigen
    Laser-Entfernungsmesser-Beobachtungen − Anzeigen

Laser-Entfernungsmesser-Beobachtungen werden in der Vermessungsansicht angezeigt. Die Farbe, in der sie angezeigt werden, hängt von der Hintergrundeinstellung im Register Ansicht / Optionen / Register Vermessungslegende ab.

TIP: Wählen Sie Wählen / Nach Abfrage, und verwenden Sie die Option Laser-Entfernungsmesser-Punkte, um Laser-Entfernungsmesser-Punkte in der Datenbank auszuwählen. Laser-Entfernungsmesser-Punkte haben eine Laser-Entfernungsmesser-Beobachtung.

So können Sie mit einem Laser-Entfernungsmesser beobachtete Punkte ansehen:

1.	Öffnen Sie das Eigenschaftsfenster in der Vermessungsansicht.

2.	Wählen Sie eine Laser-Entfernungsmesser-Beobachtung.

Verwenden Sie die Menü-Schaltflächen oder die Schaltfläche Detaillierte Seite, um die folgenden Laser-Entfernungsmesser-Beobachtungsdetails anzusehen:


Kallibrierungs- und Ausgleichungstransformationsparameter

 Wie kann ich ...

Wenn eine GPS-Kalibrierung durchgeführt wird, werden Kalibrierungsparameter berechnet, die eine Beziehung zwischen den WGS-84-Punkten (GPS-Punkten) und örtlichen Gitterpositionen in der Datenbank herstellen.

Wenn eine bedingte Netzausgleichung durchgeführt wird (wenn Sie das Netzausgleichungsmodul installiert haben), werden Transformationsparameter berechnet. Diese Parameter legen die Beziehung zwischen den Beobachtungen und den Festpunktkoordinaten fest.

Trimble Geomatics Office erlaubt entweder horizontale und vertikale Ausgleichungsparameter, abgeleitet von einer GPS-Kalibrierung oder Ausgleichungstransformationsparameter, abgeleitet von einer Ausgleichung. Wenn Sie eine Ausgleichung durchgeführt und Transformationsparameter für die Ausgleichung berechnet haben, und dann versuchen, eine GPS-Kalibrierung durchzuführen, werden Sie gewarnt, daß die Parameter entfernt werden, wenn Sie mit der Kalibrierung fortfahren.

HINWEIS: Sie können Ausgleichungstransformationsparameter, die bei einer Ausgleichung abgeleitet wurden, nicht zu Trimble Survey Controller übertragen. Sie müssen dazu eine GPS-Kalibrierung durchführen, unter Verwendung von gespeicherten Kalibrierungskoordinaten (als WGS-84-Punkte), die aus einer minimal bedingten Ausgleichung abgeleitet wurden, und ausgeglichenen Koordinaten (als Gitterpunkte), die aus einer bedingten Netzausgleichung abgeleitet wurden.


Bibliographie

Bücher

Barry, B. Austin. 1991. Errors in Practical Measurement in Surveying, Engineering, and Technology. Bearbeitet von M. D. Morris. ISBN 0-910845-47-6. Rancho Cordova: Landmark Enterprises.

Hofmann-Wellenhof, B., Herbert Lichtenegger und James Collins. 1993. Global Positioning System Theory and Practice. Second Edition. ISBN: 3-211-82477-4 und ISBN 0-387-82477-4. New York: Springer-Verlag Wien.

Leick, Alfred. 1995. GPS Satellite Surveying. Zweite Ausgabe. ISBN: 0-471-30626-6. New York: John Wiley and Sons, Inc.

Pope, Allen J. 1976. The Statistics of Residuals and the Detection of Outliers. NOAA Technical Report NOS65 NGS1, Rockville, MD.

Seeber, Günter. 1993. Satellite Geodesy, Foundations, Methods, and Applications. ISBN: 3-11-012753-9. Berlin und New York: Walter deGruyter.

U.S. National Geodetic Survey (NGS). 1986. Geodetic Glossary. Silver Spring, MD: NGS Publications Information Center.

Van Sickle, Jan. 1996. GPS for Land Surveyors. ISBN 1-575-04041-7. Ann Arbor: Ann Arbor Press, Inc.

Wolf, Paul R. und Charles D. Ghilani. 1997. Adjustment Computations: Statistics and Least Squares in Surveying and GIS. ISBN: 0471-16833-5. New York: John Wiley and Sons, Inc.

Andere Quellen - Publikationen / Periodika in den USA

Die folgenden Publikationen stellen eine nützliche Informationsquelle über Hoch- und Tiefbau und andere Aspekte der Vermessung dar:

ACSM Bulletin. ISSN: 0747-9417. Herausgegeben alle zwei Monate von American Congress on Surveying and Mapping, 5410 Grosvenor Land, Suite 100, Bethesda, MD 20814-2144 USA.

GPS World: News and Applications of the Global Positioning System. ISSN: 1048-5104. Monatlich herausgegeben von Advanstar Communications Inc. Subscription offices: P.O. Box 6148, Duluth, MN 55806-6148 USA.

P.O.B. - Point of Beginning. ISSN: 0739-3865. Monatlich herausgegeben von Business News Publishing Company, 755 W. Big Beaver Road, Ste. 1000, Troy, MI 48084 USA.

Professional Surveyor. ISSN: 0278-1425. Herausgegeben zehnmal im Jahr von Professional Surveyors Publishing Company, Inc., 1713-J Rosemont Avenue, Frederick, MD 21702-4170 USA.


Der Zoom-Navigator

Der Zoom-Navigator erscheint als kleines Fenster am unteren Rand der Projektleiste. Er gibt die Daten wieder, die im Hauptgraphikfenster von Trimble Geomatics Office angezeigt werden. Wenn Sie eines der Zoom-Symbole im Hauptfenster verwenden, verändert sich das Feld im Zoom-Navigator, um dieses entsprechend wiederzugeben. Es zeigt immer die Ausdehnung Ihres Projekts an.

Den Zoom-Navigator ausblenden (oder einblenden)

So blenden Sie den Zoom-Navigator innerhalb der Trimble Geomatics Office-Leiste aus (oder ein):

1.	Klicken Sie in der Projektleiste auf die rechte Maustaste, um auf das Verknüpfungsmenü zuzugreifen.

2.	Wählen Sie Zoom-Navigator.

Den Zoom-Navigator verwenden

So verwenden Sie den Zoom-Navigator:

  Klicken Sie im Zoom-Navigator auf einen Bereich des Projekts.

HINWEIS: Dieser Bereich wird zum Mittelpunkt des Hauptgraphikfensters.

Den Zoom-Navigator zum Zoomen verwenden:

1.	Ziehen Sie im Zoom-Navigator eine Box um den gewünschten Bereich.

Das Hauptgraphikfenster zeigt die gleichen Daten an.

2.	Wenn Sie auf den Mittelpunkt der Box im Zoom-Navigator zeigen, wird der Zeiger zu einem [image]. Dieses bedeutet, daß Sie die Box über den Projektbereich ziehen können, ohne dabei den Zoom zu verändern. Die Ansicht des Projekts im Hauptgraphikfenster gibt diese Bewegungen wieder.

  Doppelklicken Sie im Zoom-Navigator, um zur Ausdehnung des Projekts zu vergrößern.

HINWEIS: Wenn Sie eine Maus mit einem Rad haben, können Sie das Rad benutzen, um die Größe der Zoom-Navigator-Box zu ändern.


Projektleiste - Überblick

Die Projektleiste besteht aus benannten Gruppen, in denen die Verknüpfungen für häufig verwendete Aufgaben in Trimble Geomatics Office aufgelistet werden. Jede Verknüpfung steht in einem Menü zur Verfügung.

So greifen Sie schnell auf eine Aufgabe zu:

1.	Klicken Sie auf eine Verknüpfung in der Projektleiste.

2.	Klicken Sie auf eine Gruppe, um zu einem anderen Satz von Verknüpfungen zu gelangen.

So ändern Sie die Größe der Verknüpfungssymbole:

1.	Klicken Sie im Bereich der Projektleiste auf die rechte Maustaste.

Ein Verknüpfungsmenü erscheint.

2.	Wählen Sie die Option Große Symbole oder Kleine Symbole.

Führen Sie einen der folgenden Schritte aus, um die Projektleiste auszublenden (oder einzublenden):

 Klicken Sie im Bereich der Projektleiste auf die rechte Maustaste.

Ein Verknüpfungsmenü erscheint. Wählen Sie Ausblenden.

  Wählen Sie Ansicht / Projektleiste.

Klicken Sie auf das Symbol Projektleiste in der Symbolleiste.

Wenn kein Projekt geöffnet ist, sind die Gruppen Projekte und Programme verfügbar. Ist ein Projekt geöffnet, steht die komplette Liste der Gruppen (mit Ausnahme der Gruppe Programme) zur Verfügung:

  Gruppe Trimble Vermessung

  Gruppe Projekte

  Gruppe Importieren

  Gruppe Verarbeiten (wenn Sie das Basislinienverarbeitungsmodul installiert haben)

  Gruppe Ausgleichung (wenn Sie das Netzausgleichungsmodul installiert haben)

  Gruppe Exportieren

  Gruppe CAD

  Gruppe Programme


Projektleiste - Gruppe Trimble Vermessung

Die Gruppe Trimble Vermessung enthält Verknüpfungen für einen schnellen Zugriff auf häufig verwendete Aufgaben in der Vermessungsansicht. Die Verknüpfungen sind der Reihenfolge aufgelistet, in der sie normalerweise verwendet werden.


Projektleiste - Gruppe Projekte

Die Gruppe Projekte enthält Verknüpfungen für einen schnellen Zugriff auf Projektbefehle.


Projektleiste - Gruppe Importieren

Die Gruppe Importieren enthält Verknüpfungen, die einen schnellen Zugriff für das Importieren von häufig verwendeten Vermessungsdatenquellen zur Verfügung stellen.


Projektleiste - Gruppe Verarbeiten

Die Gruppe Verarbeiten enthält Verknüpfungen für einen schnellen Zugriff auf häufig verwendete Basislinienverarbeitungsaufgaben.

HINWEIS: Das Basislinienverarbeitungsmodul muß installiert sein.


Projektleiste - Gruppe Ausgleichung

Die Gruppe Ausgleichung enthält Verknüpfungen für einen schnellen Zugriff auf häufig verwendete Ausgleichungsaufgaben.

HINWEIS: Das Netzausgleichungsmodul muß installiert sein.


Projektleiste - Gruppe Exportieren

Die Gruppe Exportieren enthält Verknüpfungen, mit denen Sie Daten in Ihrem Projekt schnell zu häufig verwendeten Datenformaten exportieren können.


Projektleiste - Gruppe CAD

Die Gruppe CAD enthält Verknüpfungen für einen schnellen Zugriff auf häufig verwendete Aufgaben in der Planansicht.


Projektleiste - Gruppe Programme

Die Gruppe Programme enthält Verknüpfungen, mit deren Hilfe Sie schnell auf häufig verwendete Programme, die im Trimble Geomatics Office Softwaresystem enthalten sind, zugreifen können.


Attribute - Überblick
Attribute − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Ein Attribut ist eine beschreibende Information über einen Kartiercode. Beispiel: Beim Kartiercode ‘Baum’ kann es Attribute für Gattung, Höhe, Umfang und Zustand geben. Jeder ‘Baum’-Kartiercode, den Sie im Feld aufzeichnen, hat dann seine eigenen Werte für diese Attribute.

Trimble Geomatics Office unterstützt die Verwaltung von Attributinformationen mit Punkten. Mit Trimble Geomatics Office können Sie:

  Trimbles Feature and Attribute Editor-Programm verwenden, um Merkmals- und Attributbibliotheken zu erzeugen, die Attributdefinitionen enthalten

  Survey Controller (*.dc)-Dateien importieren, die Attribute enthalten

  Attributinformationen ansehen und bearbeiten

  Attribute hinzufügen

  die Daten in ein Geographisches Informationssystem (GIS)-Format exportieren

  einen Bericht über Attribute erzeugen

Verwenden Sie das Feature and Attribute Editor-Programm, um einen Satz von Attributen für einen Kartiercode zu definieren. Für jedes Attribut müssen Sie einen Attributnamen und -typ definieren. Der Attributtyp bestimmt das Format der Attributinformation. Beispiel: Wenn das Attribut für ‘Baum’ Höhe ist, ist der Typ des Attributs ‘numerisch’.

Sie können auch Attribut-Verzeichnis-Dateien (*.ddf) verwenden, um Attributinformationen aufzuzeichnen. Um .ddf-Dateien zu erzeugen, verwenden Sie das Trimble Data Dictionary Editor-Programm. Es ist Teil der GPS Pathfinder Office-Software.

Arbeitsablauf

Der Arbeitsablauf für die Verwaltung von Attributinformationen in Trimble Geomatics Office ist:

1.	Erzeugen Sie eine Merkmals- und Attributbibliotheks-Datei (*.fcl) im Feature and Attribute Editor.

2.	In Trimble Geomatics Office richten Sie das Projekt für Attribute ein, indem Sie eine .fcl- oder .ddf-Datei wählen.

3.	Übertragen Sie die .fcl oder .ddf-Datei zu Trimble Survey Controller (Version 7.00 oder höher).

4.	Zeichnen Sie die Daten im Feld auf.

5.	Übertragen Sie die Felddaten zu Trimble Geomatics Office.

6.	Exportieren Sie die Daten in ein GIS- oder übliches ASCII-Format.


Merkmals- und Attributbibliothek - Überblick
Merkmals- und Attributbibliothek − Überblick

Weitere Informationen

 Wie kann ich ...

Überblick

Eine Merkmals- und Attributbibliotheks-Datei (*.fcl) ist eine Textdatei, die die Definitionen von Kartiercodes, Attributen, CAD-Stilen und Steuercodes enthält. Um Merkmals- und Attributbibliotheken zu bearbeiten, verwenden Sie Trimbles Feature and Attribute Editor-Programm.

Merkmals- und Attributbibliotheken sind eine Zusammenstellung von Anweisungen, die die Bedienschritte beschreiben, die bei der Verarbeitung von Kartiercodes ausgeführt werden. Beispiel:

  Zuweisen eines spezifischen Punktstiles zu einem Punkt

  Erzeugen von Linien zwischen Punkten

  Definieren von Attributen, die im Feld aufzuzeichnen sind

  Anmerken von Punkten und Linien

Weitere Informationen über die Erstellung von Merkmals- und Attributbibliotheken finden Sie in der Hilfe des Trimble Feature and Attribute Editor Programms.

Verwenden Sie eine Merkmals- und Attributbibliotheks-Datei (*.fcl), um:

  Kartiercodes zu verarbeiten

  Attribute für die Datenerfassung im Feld zu definieren

Kartiercodeverarbeitung

Informationen über die Verwendung einer Merkmals- und Attributbibliothek zur Verarbeitung von Kartiercodes finden Sie unter dem Thema Kartiercodes – Überblick.

Attribute

Um ein Projekt für Attribute einzurichten, verwenden Sie das Dialogfeld Projekteigenschaften. Sie können eine Merkmals- und Attributbibliotheks-Datei (*.fcl) oder Attribut-Verzeichnis-Datei (*.ddf) wählen.


Ein Projekt für Attribute einrichten

 Überblick und weitere Informationen

Sie müssen ein Projekt für Attribute einrichten, um Attribute in Trimble Geomatics Office zu verwenden. Wählen Sie hierzu die Merkmals- und Attributbibliotheks-Datei (*.fcl) oder Attribut-Verzeichnis-Datei (*.ddf), die Sie verwenden möchten.

TIP: Weitere Informationen über die Auswahl einer .fcl- oder .ddf-Datei finden Sie unter dem Thema Ein Projekt für Attribute einrichten.

Trimble Geomatics Office erzeugt eine Tabelle für jeden Kartiercode mit Attributen. Die Bibliotheksdatei wird nicht im Projekt gespeichert. Dies bedeutet, daß das Projekt nicht aktualisiert wird, wenn die Bibliothek geändert wird.

Die Merkmals- und Attributbibliothek für das Projekt ändern

Um die Merkmals- und Attributbibliothek für das Projekt zu ändern, wählen Sie sie wie vorstehend beschrieben. Sie können die Merkmals- und Attributbibliothek in Trimble Geomatics Office allerdings nicht ändern nach dem:

  Importieren einer Survey Controller-Datei (*.dc), die Attribute enthält

  Hinzufügen eines Attribut-Datensatzes in Trimble Geomatics Office

Dies geschieht, da die bestehenden Merkmalstabellen gelöscht wurden, und neue Tabellen unter Verwendung der gewählten Bibliothek erzeugt werden.

Wenn Sie wirklich die Merkmals- und Attributbibliothek für ein Projekt ändern müssen, können Sie alle Punkte mit Attributen löschen, das Projekt erneut öffnen und dann eine neue Merkmals- und Attributbibliothek wählen.

Trimble Survey Controller

Stellen Sie sicher, daß die Merkmals- und Attributbibliothek (oder die Attribut-Verzeichnis-Datei), die in Trimble Geomatics Office verwendet wird, die gleiche ist, die im Feld mit dem Trimble Survey Controller verwendet wird. Wenn Sie verschiedene Bibliotheken verwenden, werden einige Attribute vielleicht nicht importiert.

Informationen über das Importieren von Daten mit Attributen bei unterschiedlichen Bibliotheken finden Sie unter Attribute mit verschiedenen Definitionen importieren.


Attribut-Verzeichnis-Dateien - Überblick
Attribut-Verzeichnis-Dateien − Überblick

Weitere Informationen

 Siehe auch

Überblick

Eine Attribut-Verzeichnis-Datei ist eine Datei, die Merkmale und zugeordnete Attribute für Merkmale definiert.

Sie kann alternativ zu einer Merkmals- und Attributbibliotheks-Datei verwendet werden.

Wenn Sie über das Data Dictionary Editor-Programm verfügen (das Teil von GPS Pathfinder Office ist), können Sie es verwenden, um Attribut-Verzeichnis-Dateien (*.ddf) zu erzeugen. Eine .ddf-Datei enthält Merkmals- und Attributdefinitionen.

Eine .ddf-Datei zum Einrichten eines Projekts für Attribute verwenden

Sie können eine .ddf-Datei verwenden, um ein Trimble Geomatics Office-Projekt für Attribute einzurichten. Wenn Sie dies tun, werden alle Linien- und Flächenmerkmale in der .ddf-Datei wie Punktmerkmale behandelt. Dies geschieht, weil Trimble Geomatics Office und Trimble Survey Controller (Version 7.00 oder höher) nur Punktmerkmale unterstützen.

Eine .ddf-Datei im Feature and Attribute Editor verwenden

HINWEIS: Die Merkmals- und Attributbibliothek, die zum Einrichten eines Projekts für Attribute verwendet wurde, muß nicht die gleiche sein, wie die Merkmals- und Attributbibliothek zur Verarbeitung der Kartiercodes. Wenn Sie allerdings Attributdaten im Feld unter Verwendung einer Merkmals- und Attributbibliothek aufzeichnen, verwenden Sie dieselbe Merkmals- und Attributbibliothek, um die Kartiercodes zu verarbeiten.

Sie können mit dem Feature and Attribute Editor-Programm .ddf-Dateien in Merkmals- und Attributbibliotheks-Dateien (*.fcl) importieren. Sie können auch eine .fcl-Datei als .ddf-Datei exportieren. Dies ist sinnvoll, wenn Sie .ddf-Dateien im Data Dictionary Editor-Programm verwenden möchten.

Eine .ddf-Datei in Trimble Survey Controller verwenden

Sie können eine .ddf-Datei im Feld als Bibliothek zur Definition von Attributen verwenden. Übertragen Sie eine .ddf-Datei dazu zu Trimble Survey Controller.


Attribute mit verschiedenen Definitionen importieren

 Überblick und weitere Informationen

Wenn Sie eine Survey Controller-Datei (*.dc) importieren, die Attribute enthält, werden die Attributdefinitionen in der .dc-Datei mit den Attributdefinitionen im Projekt verglichen. Unterscheiden sich diese Definitionen, erscheint ein Dialogfeld. Sie werden gefragt, ob Sie:

  Attributinformationen, die sowohl in der Merkmals- und Attributbibliothek als auch in der Attribut-Verzeichnis-Datei enthalten sind, importieren möchten

Wenn Sie diese Option wählen und nach der Übertragung der Datei zu Trimble Survey Controller irgendwelche Attributdefinitionen in der Merkmals- und Attributbibliothek des Projekts geändert haben, verlieren Sie die Attributinformation für diesen Kartiercode. Wenn Sie nur neue Kartiercodes hinzufügen, gehen keine Daten verloren, wenn Sie

  Punkte mit Kartiercodes aber ohne Attributinformationen einfügen

  das Importieren abbrechen

Wenn diese Meldung nicht angezeigt werden soll, stellen Sie sicher, daß die Datei, die zur Einrichtung des Projekts für Attribute verwendet wurde, dieselbe ist, wie die, die in Trimble Survey Controller verwendet wird.


Attribute in Trimble Geomatics Office ansehen/bearbeiten

 Überblick und weitere Informationen

Verwenden Sie das Eigenschaftsfenster, um Attribute für einen Punkt in Trimble Geomatics Office anzusehen und zu bearbeiten. Wenn Sie im Dialogfeld Projekteigenschaften ein Projekt für Attribute eingerichtet haben, erscheint das Register Attribute im Eigenschaftsfenster. Wenn es mehr als ein Merkmal mit Attributen für den ausgewählten Punkt gibt, verwenden Sie die Dropdown-Liste, um das Merkmal zu wählen, dessen Attribute Sie ansehen möchten. Klicken Sie auf das entsprechende Feld in der Spalte Wert, um einen Attributwert zu bearbeiten.

Für Menüattribute:

  Wählen Sie einen Wert aus der Liste verfügbarer Attributwerte.

Für alle anderen Attributtypen:

  Geben Sie den neuen Wert für das Attribut mit der Tastatur ein. Sie können die graphische Auswahl nicht für Attribute verwenden.

HINWEIS: Wenn Sie Attributinformationen bearbeiten, prüft Trimble Geomatics Office die Definition der Merkmals- und Attributbibliothek, um sicherzustellen, daß der neue Wert gültig ist.


Punkte mit Attributen zwischen Projekten kopieren/ausschneiden/einfügen

 Siehe auch

Wenn Sie Punkte mit Attributen kopieren oder ausschneiden und einfügen möchten, sollten die Merkmals- und Attributbibliotheken, die zur Einrichtung von zwei Projekten verwendet wurden, identisch sein.

Wenn die Merkmals- und Attributbibliotheken unterschiedlich sind, aber gemeinsame Attributdefinitionen haben, werden Sie gewarnt. Sie können das Einfügen abbrechen und nur Punkte (ohne Attribute) einfügen oder Punkte mit Attributen einfügen, die in beiden Bibliotheken enthalten sind. Trimble Geomatics Office zeichnet die Attribute, die nicht eingefügt wurden, im Bericht Import.rpt auf.

Sie können keine andere Bibliothek zur Einrichtung eines Attribut-Projektes wählen, wenn das Projekt bereits Punkte mit Attributen enthält. Dies ist der Fall, weil die Attributdefinitionen bereits festgelegt wurden. Sie können jedoch ein neues Projekt erzeugen, neue Attributdefinitionen in der Merkmals- und Attributbibliothek (oder Attribut-Verzeichnis-Datei) definieren und dann Punkte mit Attributen vom bestehenden Projekt in das neue Projekt kopieren.

HINWEIS: Das Kopieren oder Ausschneiden und Einfügen ist nur möglich, wenn eine der folgenden Bedingungen erfüllt ist:

  Alle Punkte, die kopiert oder ausgeschnitten werden, haben orthometrische Höhen.

  Das Projekt hat eine definierte Standardhöhe. Diese Voreinstellung wird für alle Punkte verwendet, die Null-Höhen haben.

Dies ist der Fall, da die Koordinaten für die Punkte, die kopiert/ausgeschnitten werden, auf das WGS-84-Ellipsoid reduziert werden. Das Koordinatensystem des Projekts, in das Sie einfügen, wird auf die eingefügten Punkte angewandt. Wenn das Projekt, in das Sie einfügen, ein anderes Koordinatensystem enthält, werden die richtigen Koordinaten angezeigt.


Unterschiede zwischen .fcl- und .ddf-Dateien

Sie können eine Merkmals- und Attributbibliotheks-Datei (*.fcl) oder Attribut-Verzeichnis-Datei (*.ddf) im Trimble Geomatics Office-Projekt verwenden. Wählen Sie zur Auswahl einer Datei für das aktuelle Projekt Datei / Projekteigenschaften / Register Merkmale. Die Unterschiede zwischen den beiden Dateien werden im folgenden beschrieben.

.fcl-Dateien

Eine .fcl-Datei kann CAD-Einstellungen (z. B. Punktstile, Linienstile, Anmerkungsstile und Steuercodes) für die Verwendung von Kartiercodes und Attributdefinitionen enthalten. Wenn Sie eine .fcl-Datei wählen, um ein Projekt für Attribute einzurichten, verwendet Trimble Geomatics Office die Attributdefinitionen zur Erzeugung der erforderlichen Tabellen.

Der gleiche Vorgang wird ausgeführt, wenn Sie eine .fcl-Datei mit Attributen zu Trimble Survey Controller (Version 7.00 oder höher) exportieren.

Verwenden Sie die .fcl-Dateien, wenn Sie Kartiercodes verwenden und Attribute aufzeichnen möchten. Wenn Sie bereits eine .ddf-Datei haben, aber Kartiercodes anwenden möchten, können Sie die .ddf-Datei im Feature and Attribute Editor-Programm in eine .fcl-Datei importieren und dann die .fcl-Datei verwenden.

Weitere Informationen finden Sie in der Feature and Attribute Editor-Hilfe.

.ddf-Dateien

Eine .ddf-Datei kann keine CAD-Einstellungen für die Anwendung von Kartiercodes enthalten. Sie enthält nur Merkmals- und Attributdefinitionen. Wenn Sie Kartiercodes aus einer .ddf-Datei verarbeiten, wird kein Punkt-, Linien- oder Anmerkungsstil zugewiesen.

Sie können eine .ddf-Datei im Data Dictionary Editor-Programm erzeugen (wenn Sie GPS Pathfinder Office haben) oder mit dem Feature and Attribute Editor in Trimble Geomatics Office. (Wählen Sie Datei / Exportieren im Feature and Attribute Editor, um eine .ddf-Datei zu exportieren).


Data Transfer - Überblick
Data Transfer − Überblick

Trimbles Data Transfer-Programm ist die Software, die zur Übertragung von Daten zwischen Trimble Geomatics Office und einem Gerät dient. Ein Gerät ist ein Trimble Survey Controller, ein Trimble GPS-Empfänger, eine konventionelle Totalstation, ein SDR-Datenrekorder, ein Digitalnivellier, eine Kontrolleinheit (Datenrekorder) oder eine PC-Karte. Bevor Sie Daten mit Hilfe des Data Transfer-Programms übertragen können, müssen Sie das erforderliche Gerät einrichten.

Nachdem Sie das Gerät eingerichtet haben, führen Sie folgendes durch, um in Trimble Geomatics Office auf das Data Transfer-Programm zuzugreifen:

1.	Wählen Sie Datei / Importieren oder Datei / Exportieren — abhängig davon, was Sie ausführen möchten. Das entsprechende Dialogfeld wird eingeblendet.

2.	Wählen Sie die erforderliche Option:

Wählen Sie zum Öffnen des Data Transfer-Programms eine Option, bei der eine Verbindung zu einem Gerät erforderlich ist.

Das Dialogfeld Speichern unter oder Öffnen erscheint, abhängig davon, was Sie gewählt haben.

3.	Wählen Sie das erforderliche Gerät, zu dem oder von dem Sie Daten übertragen möchten.

Zugriff auf das Data Transfer-Programm außerhalb eines Projekts

Wenn Sie kein Projekt geöffnet haben, können Sie Dateien zwischen Ihrem Computer und einem Gerät übertragen.

Führen Sie hierzu folgendes aus:

  Wählen Sie in Trimble Geomatics Office Programme / Data Transfer.

Zugriff auf das Data Transfer-Programm außerhalb von Trimble Geomatics Office

Sie können außerhalb von Trimble Geomatics Office Dateien von Ihrem Computer zu einem Gerät übertragen.

Führen Sie hierzu folgendes aus:

Wählen Sie Start / Programme / Trimble Data Transfer.


Geräte - Überblick
Geräte − Überblick

Um Daten zwischen einem Trimble Geomatics Office-Projekt und einem Gerät übertragen zu können, müssen Sie ein Gerät einrichten.

Wenn Sie ein Gerät einrichten, steht es immer beim Importieren oder Exportieren zur Verfügung. Weitere Informationen finden Sie in der Data Transfer-Hilfe.


Dialogfeld DAT-Checkin

Verwenden Sie dieses Dialogfeld, um die Werte in der (den) GPS-Datei(en) zu überprüfen und zu korrigieren, bevor Sie die GPS-Beobachtungen in ein Trimble Geomatics Office-Projekt importieren.

HINWEIS: Jede Änderung, die Sie in diesem Dialogfeld vornehmen, wirkt sich nur auf die importierten Daten aus. Die Änderungen haben keine Auswirkungen auf die GPS-Datei (*.dat).

Das Dialogfeld erscheint, wenn Sie die folgenden Dateien importieren:

  GPS-Dateien (*.dat)

  RINEX-Dateien (*.XXo, *.XXn, *.obs, *.nav)

  DC-Dateien mit zugeordneten .dat-Dateien

Verwenden

Deaktivieren Sie dieses Kontrollkästchen, wenn die Daten nicht in das Projekt übertragen werden sollen.

Name

Zeigt den Namen des Punktes an, an dem die Daten beobachtet wurden. Wenn dem Punkt in der Datei kein Name zugeordnet ist, wird die Standpunkt-ID verwendet. Benutzen Sie die Tastatur zur Namenseingabe, um dieses Feld zu ändern.

Dateiname

Zeigt die Dateiquelle der Daten an.

Startzeit

Zeigt die Startzeit und das Datum der Besetzung an.

Stoppzeit

Zeigt die Stoppzeit und das Datum der Besetzung an.

Empfängertyp

Zeigt den Typ des GPS-Empfängers an, der zur Datenerfassung verwendet wurde.

Empfänger SNR

Zeigt die Seriennummer des Empfängers an. Sie können diese Nummer bearbeiten.

Antennenhöhe

Zeigt die für die Besetzung eingegebene Antennenhöhe an. Wenn die Höhe während der Besetzung falsch eingeben wurde, können Sie dieses Feld ändern, indem Sie einen Wert mit der Tastatur eingeben.

Antennentyp

Zeigt den Typ der Empfänger-Antenne an. Wenn die Antenne während der Besetzung falsch eingegeben wurde, wählen Sie zur Änderung dieses Felds einen Antennentyp aus der Liste.

Gemessen bis

Zeigt an, bis wohin die Antennenhöhe gemessen wurde. Wenn die Methode während der Besetzung falsch eingegeben wurde, wählen Sie eine Option aus der Liste, um dieses Feld zu ändern.

Kartiercode

Zeigt den Kartiercodewert an, der dem Punkt zugeordnet ist. Verwenden Sie die Tastatur, um dieses Feld zu ändern und einen neuen Wert einzugeben.

Zurücksetzen

Klicken Sie auf Zurücksetzen, um die ursprünglichen Einstellungen wiederherzustellen.

TIP: Um die gleichen Änderungen auf mehr als einen Punkt anzuwenden, halten Sie Strg gedrückt, und wählen Sie die erforderlichen Felder in der Spalte, die Sie ändern möchten. Drücken Sie die Umschalttaste, um aufeinanderfolgende Reihen auszuwählen. Geben Sie einen Wert ein, der auf alle Felder in der Auswahl angewendet werden soll, oder wählen Sie einen in einem Feld.


Dialogfeld Digitales Nivellier importieren

 Siehe auch

Verwenden Sie das Dialogfeld Digitales Nivellier importieren:

  um Daten aus einer digitalen Nivellier-Datei anzuzeigen

  zu bestimmen, zwischen welchen Punkten Höhenunterschiede berechnet werden sollen

  um die Höhe des Startpunktes auf Gültigkeit zu überprüfen

  um Abschlußfehler an bekannten Punkten zu bestimmen

  um Punktnamen auf ihre Gültigkeit zu überprüfen

Das Dialogfeld Digitales Nivellier importieren erscheint, wenn Sie digitale Nivellier-Dateien (*.dat, *.raw) importieren. Führen Sie folgende Schritte aus:

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Digitale Nivellier-Dateien (*.dat, *.raw). Das Dialogfeld Öffnen erscheint.

3.	Wählen Sie die digitale Nivellier-Datei.

4.	Das Dialogfeld Digitales Nivellier importieren erscheint.

Alle in diesem Dialogfeld durchgeführten Änderungen wirken sich nur auf die Daten aus, die importiert werden. Die Änderungen wirken sich nicht auf die digitale Nivellier-Datei (*.dat, *.raw) aus.

HINWEIS: Wenn Sie digitale Nivellier-Daten importieren, können Sie festlegen, wie doppelte Punkte gehandhabt werden sollen. Gemäß Voreinstellung kombiniert Trimble Geomatics Office Punkte gleichen Namens beim Importieren, so daß keine doppelten Punkte erzeugt werden. Sie können im Dialogfeld Optionen doppelte Punkte die Option Doppelte Punkte innerhalb der Toleranz kombinieren verwenden, um die vertikale Toleranz für das Kombinieren doppelter Punkte festzulegen. Die horizontale Toleranz wird beim Importieren von digitalen Nivellier-Daten nicht verwendet.

HINWEIS: Sie können Daten von einem DiNi-Digitalnivellier-Gerät direkt importieren. Wenn Sie dies tun, erscheint das Dialogfeld Digitales Nivellier importieren.

TIP: Wenn Sie digitale Nivellier-Daten erfassen, speichern Sie die Punkte, die Sie in Trimble Geomatics Office importieren möchten, mit einem eindeutigen Präfix oder Suffix. Speichern Sie z. B. alle Punkte, die als Standpunkte verwendet werden sollen, mit dem Präfix STN. Dadurch können Sie Punkte, oder Punkte, die nicht importiert werden sollen, einfach unter Verwendung der Schaltfläche Nach Filter wählen im Dialogfeld Digitales Nivellier importieren auswählen.

In der Gruppe Höhe befinden sich die folgenden Felder:

Startpunkt

Der Name des Startpunktes. Der Startpunkt in einem Nivellement wird durch das Startpunkt-Symbol angezeigt.

Höhe

Die Höhe des Startpunktes. Sie können die Höhe eines Startpunktes bearbeiten, wenn der Punkt in der Tabelle gewählt ist. Wenn Sie eine andere Nivellement-Schleife in der Tabelle wählen, wird der Startpunkt für diese Schleife in der Gruppe Höhe angezeigt. Das Ende einer Nivellement-Schleife und der Beginn einer anderen Schleife werden durch eine dicke, schwarze, horizontale Linie in der Tabelle angezeigt.

Höhenqualität

Die Qualität des Höhenfeldes. Klicken Sie auf die Schaltfläche Qualität, um die Höhenqualität zu ändern.

Die Daten in der Tabelle Digitales Nivellier werden in der Reihenfolge angezeigt, in der die Beobachtungen durchgeführt wurden. Die folgenden Spalten können angezeigt werden:

Spalte	Was angezeigt wird
Standpunkte	Der Punktname und ob der Punkt als Standpunkt zum Importieren in Trimble Geomatics Office gewählt wurde. Wenn Sie eine Datei importieren, werden als Voreinstellung alle Beobachtungen gewählt. Der Name des Standpunktes kann geändert werden.
Rückbl.	Die Nivellierbeobachtung zum Rückblick.
Zwischenbl.	Die Nivellierbeobachtung zu einem Zwischenblick. Sie können den Zwischenblick nicht wählen, bevor nicht der dazugehörige Rückblick gewählt ist.
Vorbl.	Die Nivellierbeobachtung zum Vorblick.
Höhe	Die Höhe des Punktes. Ein Symbol wird verwendet, um anzuzeigen, welcher Punkt als Startpunkt für die Berechnung der orthometrischen Höhe verwendet wurde. Dies entspricht dem Startpunkt, der in der Gruppe Höhe angezeigt wird. Die Höhe der Startpunkte in allen Schleifen kann von der Gruppe Höhe aus bearbeitet werden. Wenn ein Punkt keine orthometrische Höhe hat, dann ist kein Startpunkt für die Berechnung der Höhe des Punktes gewählt.
Strecke	Die Strecke zu Rückblick, Vorblick oder Zwischenblick.
Beschreibung	Die Beschreibung des Nivellier-Punktes.
Abgesteckte Deltas	Der Höhenunterschied zwischen einem Punkt, der abgesteckt wurde, und der Sollhöhe für einen Punktstandort.

So wählen Sie Punkte in der Tabelle aus:

  Aktivieren Sie das Kontrollkästchen in der Spalte Standpunkt.

  Klicken Sie auf die Spaltenüberschrift Standpunkt. Sie können alle Punkte in der Tabelle wählen, indem Sie die Spalte oben anklicken und dann den ersten Punkt in der Spalte wählen.

  Wählen Sie Nach Filter wählen.

Nachdem Sie eine Auswahl getroffen haben, gelten die folgenden Regeln:

  Sie können einen Zwischenblick erst wählen, nachdem der vorhergehende Rückblick gewählt wurde.

  Wenn es mehr als einen Punkt mit demselben Namen gibt, werden alle anderen Beobachtungen (außer bei Zwischenblicken) mit demselben Namen gewählt.

Wenn Sie auf Nach Filter wählen klicken, erscheint das Dialogfeld Nivellier-Standpunkte definieren.

HINWEIS: Die folgenden digitalen Nivellier- und Speicherformate werden unterstützt:

HINWEIS: Trimble Geomatics Office unterstützt keine Leica-Meßaufzeichnungen, die außerhalb der Nivellierbeobachtung, d.h. 330-Datensätzen, aufgezeichnet werden.


Dialogfeld Nivellier-Standpunkte definieren

Weitere Informationen

 Siehe auch

Das Dialogfeld Nivellier-Standpunkte definieren erscheint, wenn Sie im Dialogfeld Digitales Nivellier importieren auf Nach Filter wählen klicken. Verwenden Sie diese Filteroption, um Standpunkte zu wählen oder eine Auswahl rückgängig zu machen. Als Voreinstellung werden alle Standpunkte im Dialogfeld Digitales Nivellier importieren gewählt.

TIP: Wenn Sie digitale Nivellier-Importdaten erfassen, speichern Sie die Punkte, die Sie in Trimble Geomatics Office importieren möchten, mit einem eindeutigen Präfix oder Suffix. Speichern Sie z. B. alle Punkte, die Sie als Standpunkt verwenden möchten, mit dem Präfix STN. Dadurch können Sie Punkte einfach unter Verwendung der Schaltfläche Nach Filter wählen im Dialogfeld Digitales Nivellier importieren auswählen.

Die Optionen sind:

Punkte wählen mit

Verwenden Sie diese Option, um Standpunkte in der Spalte Standpunkte im Dialogfeld Digitales Nivellier importieren zu wählen. Sie können z. B. Standpunkte mit einem bestimmten Präfix oder Suffix wählen.

HINWEIS: Die Kontrollkästchen für alle Punkte ohne besonderes Präfix oder Suffix werden deaktiviert.

Punktauswahl rückgängig machen mit

Verwenden Sie diese Option, um für bestimmte Punkte das Kontrollkästchen in der Spalte Standpunkte im Dialogfeld Digitales Nivellier importieren zu deaktivieren. Sie können z. B. die Auswahl von Standpunkten mit einem bestimmten Präfix oder Suffix aufheben.

HINWEIS: Dieses Kontrollkästchen wird für alle Punkte ohne besonderes Präfix oder Suffix aktiviert.

Name

Verwenden Sie dieses Feld, um Punkte nach Namen zu wählen. Sie können Punkte unter Verwendung der ?, * oder #  Jokerzeichen (Wildcards) wählen.

Beschreibung

Verwenden Sie dieses Feld, um Punkte anhand ihrer Beschreibung zu wählen. Sie können auch hier wieder die Beschreibung unter Verwendung von Jokerzeichen (Wildcards) wählen.

Beispiel:

Wenn Sie nicht möchten, daß Punkte mit dem Präfix "IS" in der Spalte Standpunkt des Dialogfeldes Digitales Nivellier importieren gewählt werden:

1.	Wählen Sie im Dialogfeld Nivellier-Standpunkte definieren die Option Punktauswahl rückgängig machen mit.

2.	Wählen Sie die Option Name und geben Sie IS* ein.


Nivellierbeobachtungen in einer Netzausgleichung verwenden

Wenn Sie eine Netzausgleichung unter Verwendung von Nivellement-Daten durchführen möchten, müssen mittlere Fehler für die Nivellierbeobachtungen definiert sein. Die Software berechnet mittlere Fehler in den folgenden Situationen:

  Wenn Sie digitale Nivellement-Daten importieren, wird der mittlere Fehler (Höhenunterschied) unter Verwendung der Anzahl der Drehungen berechnet.

  Der mittlere Fehler wird unter Verwendung des Trimble Datenaustauschformats berechnet, wenn Sie die Anzahl der Drehungen in das Importformat einschließen. Alternativ hierzu kann der mittlere Fehler (Höhenunterschied) direkt aus der Datei verwendet werden.

Wenn der mittlere Fehler nicht definiert ist, werden die Nivellierbeobachtungen nicht für die Ausgleichung markiert.

HINWEIS: Sie können den mittleren Fehler oder die Anzahl der Drehungen für jeden Höhenunterschied im Eigenschaftsfenster eingeben.


Dialogfelder GIS-Exportfehler

Diese Dialogfelder erscheinen, wenn der GIS-Export fehlgeschlagen ist.

Einige mögliche Ursachen sind in der folgenden Tabelle dargestellt:


Dialogfeld Geoid-Modell wählen - Fehlerbehebung
Dialogfeld Geoid-Modell wählen − Fehlerbehebung

Wenn beim Importieren einer Geräte-Datei der in der Datei referenzierte Name des Geoid-Modells nicht mit einem der Namen der Geoid-Modelle in der Koordinatensystem-Datenbank (Current.csd) übereinstimmt, erscheint dieses Dialogfeld. Wählen Sie das Geoid-Modell, das Sie verwenden möchten.

Dieses Dialogfeld kann in folgenden Situationen angezeigt werden:


Fehlender Drucker

Um aus Trimble Geomatics Office zu drucken oder zu plotten, muß auf Ihrem Computer ein Drucker installiert sein.

So installieren Sie einen Drucker:

1.	Klicken Sie auf Start.

2.	Wählen Sie Einstellungen / Drucker. Das Drucker-Fenster erscheint.

3.	Doppelklicken Sie auf Neuer Drucker. Folgen Sie den Installationsanweisungen, um Ihren Drucker zu den Microsoft Windows-Einstellungen hinzuzufügen.

Nach der Installation eines Druckers können Sie aus Trimble Geomatics Office drucken.


Dialogfeld Datum-Gitternetzmodell wählen

Wenn der Name der Datum-Gitternetz-Datei, der in der  importierten Datei referenziert ist, nicht mit einer der Datum-Gitternetz-Dateien in der Koordinatensystem-Datenbank übereinstimmt, erscheint dieses Dialogfeld.

Verwenden Sie dieses Dialogfeld, um die geeignetste kombinierte Datum-Gitternetz-Datei zur Verwendung im System zu wählen.

Dieses Dialogfeld kann in folgenden Situationen angezeigt werden:


Meldungen und Dialogfelder beim Importieren einer Survey Controller-Datei (*.dc)

Wenn Sie eine Survey Controller-Datei (*.dc) in Trimble Geomatics Office importieren, führt die Software eine Reihe von Prüfungen an der Datei durch und warnt Sie, wenn die Koordinatensysteme der .dc-Datei und des Projekts nicht übereinstimmen.

Im folgenden sind die möglichen Meldungen und Dialogfelder aufgelistet, die erscheinen, wenn eine .dc-Datei importiert wird:

  Eine oder mehrere Meldungen wurden beim Importieren der Datei erzeugt

  Die für dieses Projekt definierte Merkmals- und Attributdatei sind verschieden

  Es wurde keine Merkmals- und Attributdatei für dieses Projekt definiert

  Die Datei konnte nicht importiert werden

  Dialogfeld Voreingestellte Projektionsdefinition

  Dialogfeld Doppelte Punkte

  Dialogfeld Projekt-Koordinatensystem

  Dialogfeld Datum-Gitternetzmodell wählen

  Dialogfeld Geoid-Modell wählen


Meldung - Eine oder mehrere Meldungen wurden beim Importieren der Datei erzeugt
Meldung − Eine oder mehrere Meldungen wurden beim Importieren der Datei erzeugt

Beim Importieren der Datei hat die Software einen oder mehrere Fehler gefunden.

Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf Nein , um die Meldung zurückzuweisen und die Fehlermeldungen zu ignorieren.

  Klicken Sie auf Ja, um die Fehler anzusehen.

Ein Import-Bericht erscheint im voreingestellten HTML-Anzeigemodul.

Klicken Sie auf den Link der Fehlermeldung oder rollen Sie nach unten zum Abschnitt Fehler des Import-Berichts, um die Fehler zu prüfen.

Falls notwendig, beheben Sie die Fehler, und importieren Sie die Datei erneut.


Meldung - Die für dieses Projekt definierte Merkmals- und Attributdatei sind verschieden
Meldung − Die für dieses Projekt definierte Merkmals- und Attributdatei sind verschieden

Beim Importieren einer Survey Controller-Datei (*.dc) wurde herausgefunden, daß sich die Merkmals- und Attributbibliotheks-Datei oder die Attribut-Verzeichnis-Datei, die zur Einrichtung des Projekts verwendet wurde, von den in der .dc-Datei referenzierten Dateien unterscheidet.

Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf Ja, um die gemeinsamen Attribute der .dc-Datei und des Projekts zu importieren.

  Klicken Sie auf Nein, um nur Punkte aus der .dc-Datei zu importieren.

Wenn diese Meldung nicht mehr angezeigt werden soll, stellen Sie sicher, daß die von Ihnen verwendete Bibliothek dieselbe ist wie die, die zur Aufzeichnung von Attributinformationen im Feld verwendet wurde.


Meldung - Es wurde keine Merkmals- und Attributdatei für dieses Projekt definiert
Meldung − Es wurde keine Merkmals- und Attributdatei für dieses Projekt definiert

Beim Importieren einer Survey Controller-Datei (*.dc), die Attributinformationen enthält, konnte Trimble Geomatics Office keine für das Projekt definierte Merkmals- und Attributbibliotheks-Datei oder Attribut-Verzeichnis-Datei finden.

Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf OK, um nur die Vermessungsdaten zu importieren und die Attributinformationen aus der .dc-Datei zu ignorieren.

  Klicken Sie auf Abbrechen, um das Projekt für Attribute im Dialogfeld Projekteigenschaften / Register Merkmale mit derselben Bibliothek einzurichten, die von der .dc-Datei referenziert ist. Dann importieren Sie die .dc-Datei erneut.


Die Datei konnte nicht importiert werden

Beim Importieren einer Datei ist ein Fehler aufgetreten, der dazu führte, daß die Datei nicht importiert wurde. Die folgende Meldung erscheint:

Die Datei <Dateiname> konnte nicht importiert werden.

Prüfen Sie, ob die Datei in einer anderen Anwendung geöffnet ist (Beispiel: Eine Survey Controller-Datei (*.dc) kann im DC File Editor-Programm geöffnet sein). Ansonsten ist die Datei vielleicht beschädigt.


Kartiercodes - Überblick
 # [image] Kartiercodes − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Kartiercodes stellen eine Methode zur Erfassung von Punkten dar, die zum Zweck einer bestimmten Verarbeitungsform zusammen gruppiert werden müssen. Sie können z. B. jeden Punkt, der entlang einer Zaunlinie aufgezeichnet wurde, als "ZAUN" codieren, so daß, im Büro angelangt, alle Punkte mit dem Kartiercode  "ZAUN" mit einem bestimmten Linienstil miteinander verbunden werden können.

Um mit Kartiercodes zu arbeiten, müssen Sie:

  eine Merkmals- und Attributbibliotheksdatei (*.fcl) erstellen.

  die Bibliothek zu Trimble Survey Controller übertragen

  die Bibliothek zu einem TDS Survey Pro übertragen

  Daten unter Verwendung von Kartiercodes in der Bibliothek aufzeichnen

  eine Survey Controller (*.dc)-Datei zu Trimble Geomatics Offic übertragen

  Kartiercodes verarbeiten

Eine Merkmals- und Attributbibliothek ist ein Satz von Anleitungen.

Verwenden Sie das Feature and Attribute Editor-Programm, um neue Bibliotheken zu erstellen. Sie können so viele Dateien erstellen, wie Sie benötigen. Wenn Kartiercodes verarbeitet werden, weisen die Anleitungen Trimble Geomatics Office an, was mit den Daten in der Auswahl geschehen soll. Wenn der Wert in einem Kartiercode-Feld mit einer in der Merkmals- und Attributbibliothek festgelegten Bedingung übereinstimmt, werden die assoziierten Aktionen durchgeführt.

Weitere Informationen über Merkmals- und Attributbibliotheken finden Sie in der Hilfe des Feature and Attribute Editor-Programms.


Kartiercodes - Verarbeitungsreihenfolge
 Kartiercodes − Verarbeitungsreihenfolge

 Überblick und weitere Informationen

Alle Kartiercodes in einer aktuellen Auswahl werden verarbeitet, aber die von Ihnen verwendete Auswahlmethode bestimmt die Verarbeitungsreihenfolge.

Auswahlmengen

Wenn eine Survey Controller (*.dc)-Datei importiert wird, wird eine Auswahlmenge erzeugt. Sie trägt denselben Namen wie die .dc-Datei und zeichnet die Reihenfolge auf, in der Punkte im Feld erfasst wurden. Wenn Sie diese Auswahlmenge verwenden, werden Kartiercodes in der Reihenfolge verarbeitet, in der sie aufgezeichnet wurden.

Andere Auswahlmethoden

Sie können zudem einen der folgenden Schritte durchführen:

  Wählen Sie einen Befehl aus dem Menü Wählen.

  Klicken Sie auf einen Punkt.

Bei diesen Methoden kann es vorkommen, daß die Verarbeitung nicht in der Reihenfolge stattfindet, in der die Daten aufgezeichnet wurden.


Kartiercodes - Häufige Fehler
 Kartiercodes − Häufige Fehler

 Überblick und weitere Informationen

Die folgenden typischen Fehler können auftreten, wenn Sie Kartiercodes verwenden.

Inkorrektes Verbinden aufgrund der Verwendung einer falschen Auswahlmenge

Inkorrekte Verbindungen können auftreten, wenn Sie die graphische Auswahl (oder den Befehl Wählen / Alle) verwenden, um Punkte für die Kartiercodierung auszuwählen, anstelle einer Auswahlmenge, die beim Datenimport vom System erzeugt wurde.

HINWEIS: Alle Elemente, die aus einer Datei importiert wurden, werden in einer Auswahlmenge gespeichert. Bei Survey Controller (*.dc)-Dateien wird die Auswahlmenge nach der internen Projektbezeichnung in der Datei benannt. Das bedeutet, daß in der Auswahlmenge die Reihenfolge beibehalten wird, in der die Vermessungsarbeit ausgeführt wurde. Dies ist im allgemeinen für die Kartiercode-Verarbeitung erforderlich.

Die Steuercodes neben den falschen Punktcode setzen

Zum Beispiel: CURB1 LP ST

Hier ist der Punkt eine Beobachtung eines Laternenpfahls, der sich auf der Bordsteinlinie befindet. Die Bordsteinbeobachtung ist der Start einer neuen Bordsteinlinie. Der Laternenpfahl ist ein Punkt, der mit dem entsprechenden Symbol geplottet werden sollte. Der Befehl ST (Start) wird auf den Punkt angewendet, dem er nachgestellt ist (d. h. dem Laternenpfahl). Dies bedeutet, daß die Linie von dem letzten Punkt mit der Bezeichnung CURB1 zu dem aktuellen Punkt gezogen wird, was nicht die Absicht der Codierung ist.

Die Codierung sollte die folgende sein: CURB1 ST LP oder LP CURB1 ST

Der Befehl ST (Start) wurde nicht eingesetzt

Dies führt dazu, daß kontinuierliche Linien zwischen Punkten mit demselben Code dort gezogen werden, wo sie nicht vorgesehen waren.


Feldcodes - Überblick
Feldcodes − Überblick

Weitere Informationen

 Wie kann ich ...

Überblick

Feldcodes sind spezielle Anleitungen, die Trimble Geomatics Office anweisen, Informationen in Felder einzufügen. Feldcodes werden zudem bei der Übertragung von Datenbank-Daten in ASCII-Import-/Exportvorgängen oder benutzerdefinierten Berichtsvorgängen verwendet. Feldcodes sind unter verschiedenen Infos gruppiert. Eine Liste von jeder Info und Links zu Einzelheiten über jeden Feldcode finden Sie unter Feldcode-Details.

Trimble Geomatics Office verwendet Feldcodes häufig. Feldcode werden z. B. verwendet für:

  Projektnamen und Datum in der Projektinfo, wenn ein neues Projekt erstellt wird

  Anmerkungen

  Beschriftungen

  benutzerdefinierte Punktbeschriftungen

  ASCII-Import/Export

  Berichtsdefinitionen

Feldcodes werden grundsätzlich von eckigen Klammern umschlossen. Alle Zeichen, die sich innerhalb der '[]' Klammern befinden, werden als möglicher Feldcode-Ausdruck behandelt und durch den entsprechenden Feldcode-Wert ersetzt, wenn einer vorhanden ist.

Sie können Trimble Geomatics Office z. B. anweisen, jeden Punkt in der Datenbank mit Hilfe der benutzerdefinierten Beschriftung mit seinem eigenen Namen zu beschriften, indem der Feldcode '[Name]' verwendet wird. Sie können diese Beschriftungen erweitern, um Höhen einzuschließen, indem Sie den Feldcode '[Höhe]' hinzufügen.

Mit den entsprechenden Einstellungen könnte der Feldcode [$Koordinatensystem.Zone] "California Zone 3 0403" anzeigen und der Feldcode [Kartiercode] könnte "BAUM" anzeigen. Unter Verwendung der Feldcodes [Datum] und [Zeit] können weitere Informationen wie aktuelles Datum und Zeit des Computersystems ausgegeben werden.

Als weiteres Beispiel könnte der Feldcode Name=[Name] Elv=[Höhe]  den folgenden Berichtstyp erzeugen:

Name=3397 Höhe=18.762

Name=3396 Höhe=18.702

Name=3432 Höhe=?

Name=3436 Höhe=16.372

Um auf Feldcodes zuzugreifen, klicken Sie mit der rechten Maustaste in das Feld, zu dem Sie den Feldcode hinzufügen möchten. Wenn Feldcodes verfügbar sind, erscheint die Option Felder im Verknüpfungsmenü.

Syntax

Die Syntax eines Feldcodes besteht aus drei Elementen:

[Kontext.Name:Optionen]

Verwenden Sie die Kontext-Komponente, um Mehrdeutigkeiten zwischen Feldcodenamen auszuschließen. Der Feldcode [Name] zeigt immer den Punktnamen für den aktuellen Punkt aus der Datenbank an. Wenn Sie den Projektnamen mit Hilfe eines Feldcodes anzeigen möchten, muß der Kontext $Projekt enthalten sein (das bedeutet, der Feldcode [$Projekt.Name] ist erforderlich), ansonsten wird der aktuelle Punktname dargestellt.

Die Kontext-Komponente ist optional. Wenn diese weggelassen wird, nimmt Trimble Geomatics Office den logischsten Kontext.

Die Optionen, die in einem Feldcode enthalten sein können, sind gewöhnlich Zusatzoptionen für den Feldcode. Diese Komponente ist auch optional.


Feldcode-Details

 Überblick und weitere Informationen

Feldcodes sind in mehrere Infos aufgeteilt:


Datenbank-Feldcodes

 Überblick und weitere Informationen

Datenbank-Feldcodes bieten die direkte Ausgabe von gespeicherten und berechneten Werten aus der Datenbank. Sie können zusätzlich den Namen der Tabelle, aus der die Daten zu entnehmen sind, einem Datenbank-Feldcode voranstellen.

Der Feldcode [Punkt.Rechtswert] entnimmt z. B. die Rechtswerte aus der Punktetabelle. Wenn Sie nur [Rechtswert] angeben, wird ebenfalls den Rechtswert aus der Punktetabelle entnommen, solange diese Tabelle die einzige mit einem Rechtswert-Feld ist. Falls die kleinste Möglichkeit einer Mehrdeutigkeit besteht, sollte der Name der Tabelle angegeben werden.

Verfügbare Feldcodes sind kontextabhängig. Gültige Namen sind von dem Kontext abhängig, aber die Feldcodes, die gewöhnlich mit den Datenbank-Tabellen assoziiert sind, sind:

Datenbank-Feldcodes

Der Wert eines Datenbankfeldes wird direkt aus der Datenbank entnommen (z. B. Rechtswert).

Berechnete Feldcodes

Die folgende Tabelle zeigt die berechneten Feldcodes an, die gültig sind:

$Mittelpunkt{<Trennzeichen>}

Für einen Bogen gibt es einen speziellen $Mittelpunkt-Feldcode, der entweder den Namen des Mittelpunkts (wenn ein Datenbankpunkt verwendet wurde) oder die Mittelpunktkoordinaten anzeigt.

Sie können ein Trennzeichen festlegen, das zwischen den Koordinatenwerten dargestellt wird. Wenn das Trennzeichen weggelassen wird, wird das Zeichen 'Listentrennzeichen', das unter Microsoft Windows Systemsteuerung / Ländereinstellungen festgelegt wurde, verwendet.

Erste Ordinate

Der Wert der ersten Ordinate (Rechtswert oder Hochwert), abhängig von der Ausgabereihenfolge.

Zweite Ordinate

Der Wert der zweiten Ordinate (Hochwert oder Rechtswert), abhängig von der Ausgabereihenfolge.

Name erste Ordinate

Der Name der ersten Ordinate (Rechtswert oder Hochwert), abhängig von der Ausgabereihenfolge.

Name zweite Ordinate

Der Name der zweiten Ordinate (Rechtswert oder Hochwert), abhängig von der Ausgabereihenfolge.


System-Feldcodes

 Überblick und weitere Informationen

System-Feldcodes ermöglichen den Zugriff auf eine Reihe von Systemdetails und bieten eine Reihe spezieller Funktionen. Verwenden Sie System-Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS: Jedem dieser System-Feldcodes kann ein $System-Präfix hinzugefügt werden. Der Feldcode [$System.Zeit] zeigt z. B. die aktuelle Computerzeit zum Zeitpunkt der Verwendung von Feldcodes an.

Obwohl diesen Feldcodes kein $System-Präfix hinzugefügt werden muß, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden. Der Feldcode [Zeit] zeigt z. B. denselben Wert an, wie der Feldcode [$System.Zeit].

Zeit

Zeigt die aktuelle Zeit des Computers zum Zeitpunkt der Verwendung des Feldcodes an.

Datum

Zeigt das aktuelle Systemdatum des Computers zum Zeitpunkt der Verwendung des Feldcodes an.

Zusammenfassung

Zeigt die Zusammenfassung des 'aktuellen Elements' an.

HINWEIS: Der für einen Punkt verwendete Feldcode Zusammenfassung wird in der OPTIONS.INI-Datei, die mit dem Projekt assoziiert ist, definiert. Gewöhnlich verwendet diese die Feldcodes Name und Kartiercode in der Form [Name] : [Kartiercode].

Leerzeichen:<Anzahl der Leerstellen>

Zeigt eine oder mehrere Leerstellen an.

Der Feldcode [$System.Leerzeichen:3] liefert z. B. drei Leerzeichen.

Wiederholen<Zu wiederholende Zeichenfolge>:<Anzahl der Kopien>

Zeigt einen wiederholten Textanteil an. Der Text, der wiederholt werden soll, muß von Winkelklammern (< >) umschlossen sein.

Der Feldcode [$System.Wiederholen<->:80] zeigt z. B. bis zu achtzig Zeichen an. Weitere Informationen finden Sie unter Parametereingabe-Dialogfeld.

Spalte:<Spaltennummer>

Zeigt Leerzeichen in einer Zeile von der aktuellen Position bis zur festgelegten Spalte an.

Der Feldcode [$System.Spalte:40] fügt z. B. so viele Leerzeichen ein, bis die 40. Spalte in der aktuellen Zeile erreicht ist.

Ersetzen<Gesuchte Zeichenfolge>:<Zu ersetzende Zeichenfolge>

Ersetzt den angegebenen 'gesuchten' Text mit dem 'zu ersetzenden' Text. Der Feldcode Ersetzen<Gesuchte Zeichenfolge>:<Zu ersetzende Zeichenfolge> muß hinter den Feldern stehen, in denen die Vorgänge Suchen und Ersetzen ausgeführt werden sollen. Wenn der Feldcode Ersetzen vor dem Feld erscheint, daß Sie finden und ersetzen möchten, wird das Feld nicht geändert.

Die Angabe des zu ersetzenden Texts ist optional. Falls er nicht angegeben ist, wird der 'gesuchte' Text aus der Zeile entfernt.

Der Feldcode [$System.Ersetzen<°><Grad>] findet z. B. jedes Grad-Symbol in der aktuellen Zeile und ersetzt diese mit dem Wort 'Grad'.

Zeichen:Zeichencode

Fügt ein Zeichen durch die Angabe seines Zeichencodes ein.

HINWEIS: Die Zeichenausgabe verändert sich, abhängig von der verwendeten Schriftart.

Der Feldcode [$System.Zeichen:169] gibt z. B. bei den meisten Schriftarten das (c) aus.

Benutzername

Zeigt den Anmeldenamen des Benutzernetzes an.

Computername

Zeigt die Netzwerkidentifikation an. Sie können diese Identifikation in Ihrem System mit Microsoft Windows Systemsteuerung / Netzwerk ändern.

Über

Zeigt den Produktnamen und die Versionsnummer an, z. B. Trimble Geomatics Office, Version 1.60

Verzeichnisname

Es gibt eine Reihe verschiedener Feldcodes, mit denen spezifische, systemabhängige Ordnernamen zur Verfügung gestellt werden.

Die verfügbaren Verzeichnisnamen sind:

ASCII-Export

Die beiden Feldcodes, die nur für den ASCII-Export Gültigkeit haben, sind:

Zählen	Zeigt die Anzahl der verwendeten Feldcodes an. Er kann verwendet werden, um jeden exportierten Wert individuell zu identifizieren.
Zeile	Zeigt die Zeilennummer in einer Export-Datei an. Er wird zur Verfügung gestellt, um ASCII-Definitionen zu berücksichtigen, die für jede Zeile in der Datei eine Zeilennummer haben.


Parametereingabe-Dialogfeld

WARNUNG: Trimble Navigation Limited unterstützt die Verwendung oder Modifikation dieser Datenbank nur bei der Verwendung mit Trimble Geomatics Office. Trimble unterstützt oder autorisiert weder die Verwendung noch die Modifikation oder garantiert die Leistung dieser Datenbank beim Einsatz mit anderen Software-Anwendungen. Trimble kann das Format dieser Datenbank jederzeit modifizieren, so daß die Datenbank nicht länger mit Software-Anwendungen kompatibel ist.

Dieses Dialogfeld erscheint, wenn Sie einen Wert (Werte) eingeben müssen, um eine Auswahlabfrage oder einen Feldcode zu vervollständigen. Wählen Sie Abfragen und Feldcodes, die Parameter mit einer Ellipse (...) erfordern. Das Dialogfeld erscheint an mehreren Stellen in Trimble Geomatics Office.

Name

Zeigt den/die zu definierenden Parameter an.

Wert

Geben Sie den/die erforderlichen Wert(e) ein.

Ein Parametereingabe-Dialogfeld erscheint, wenn Sie einen Datenbank-Bericht ausführen, der auf den Ergebnissen einer Datenbank-Abfrage beruht.


Projekt-Feldcodes

 Überblick und weitere Informationen

Projekt-Feldcodes bieten Zugriff auf spezifische Projektinformationen. Verwenden Sie diese Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS: Jeder dieser Projekt-Feldcodes kann mit dem Präfix $Projekt versehen werden. Der Feldcode [$Projekt.Projektion] zeigt z. B. die Bezeichnung des Koordinatensystem-Projektionstyps an, der für das Projekt verwendet wird.

Obwohl diese Feldcodes nicht mit einem $Projekt-Präfix versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden. Der Feldcode [Name] zeigt z. B. denselben Wert an, wie der Feldcode [$Projekt.Name].

Name

Zeigt den Projektnamen an, den Sie für das Projekt verwendet haben.

Pfad

Zeigt den Namen des Ordners an, in dem Projekte gespeichert sind.

HINWEIS: Dieser Feldcode hat die gleiche Ausgabe wie der Feldcode $System.Projektverzeichnis.

Projektion

Zeigt den Namen des Koordinatensystem-Projektionstyps an, der für das Projekt verwendet wird, z. B. Transversal-Mercator.

Automatisch benennen

Zeigt den aktuellen Namen für die automatische Punktbenennung an.

So wird z. B. AUTO 0009 angezeigt, wenn der zuvor zugeordnete Name für die automatische Punktbenennung AUTO 0008 war.

CAD-Layer

Zeigt den Namen des aktuellen CAD-Layers an.

Einheiten:Typ

Zeigt die entsprechende Einheitenbezeichnung an. Sie müssen grundsätzlich einen Typ angeben.

HINWEIS: Strecke, Höhe, Koordinate und Winkel sind verfügbar.

Der Feldcode [$Projekt.Einheiten:Strecke] zeigt z. B. die Streckeneinheit an, die für das System eingestellt ist. Sie können den Namen ':wörtlich' hinzufügen, um einen vollständigen Feldcode-Wert zu erhalten. Um z. B. 'Meter' anstelle von 'm' zu erhalten, verwenden Sie den Feldcode [$Projekt.Einheiten:Strecke:wörtlich].

Typ:Strecke

Zeigt den Anzeigetyp für Strecke an. Sie können ihn unter Datei / Projekteigenschaften / Einheiten und Format festlegen.

Typ:BLH

Zeigt den Anzeigetyp für Breitengrad, Längengrad und Höhe (örtlich oder WGS-84) an.


Info-Feldcodes

 Überblick und weitere Informationen

Die Info-Feldcodes ermöglichen den Zugriff auf die Daten, die in den Feldern mit der Projekt-Info im Register Projektdetails des Dialogfelds Projekteigenschaften gespeichert sind. Verwenden Sie diese Informationen, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS:  Jeder dieser Info-Feldcodes kann mit einem Präfix $Info versehen werden. So zeigt der Feldcode [$Info.Titel] z. B. den Titel für das aktuelle Projekt an.

Wenn eine dieser Infos geändert wird, ändern sich die verfügbaren Info-Feldcodes, um dies widerzuspiegeln.

Obwohl diese Feldcodes nicht mit einem Präfix $Info versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden.

Die Standard-Info-Feldcodes sind:

Titel

Zeigt den Titel des aktuellen Projekts an.

Beschreibung

Zeigt eine Beschreibung des Projekts an.

Referenz

Zeigt eine Projekt-Referenznummer an, so daß Sie das Projekt mit dem Büro-Kalkulationsverfahren verknüpfen können.

Feld-Vermesser

Diese Feldcode-Ausgabe kann zur späteren Bezugnahme nützlich sein.

Computer Operator

Diese Feldcode-Ausgabe kann zur späteren Bezugnahme nützlich sein.

Datum

Zeigt das Erstellungsdatum des Projekts an. Dieses wird in einem Vorlage-Projekt automatisch mit Hilfe des Datum-Feldcodes bestimmt.

Vertikales Datum

Zeigt das vertikale Datum des Projekts an.

Ausrüstung

Zeigt die Seriennummer(n) Ihrer Ausrüstung an.


Koordinatensystem-Feldcodes

 Überblick und weitere Informationen

Koordinatensystem-Feldcodes bieten Zugriff auf spezifische Details des Koordinatensystems für das Projekt. Verwenden Sie diese Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS: Jeder dieser Koordinatensystem-Feldcodes kann mit einem Präfix $Koordinatensystem versehen werden. Der Feldcode [$Koordinatensystem.System] zeigt z. B. den Namen des Koordinatensystems an, das für das Projekt verwendet wird.

Obwohl diese Feldcodes nicht mit einem Präfix $Koordinatensystem versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden.

HINWEIS: Die $Koordinatensystem-Feldcodes werden als 'Nicht gewählt' angezeigt, wenn keine Einstellung verfügbar ist.

System

Zeigt den Namen des Koordinatensystems an, das für das Projekt gewählt wird (z. B. United States State Plane 1983).

Zone

Zeigt den Namen der Koordinatensystemzone an, die von dem Projekt verwendet wird (z. B. California Zone 3 0403).

Datum

Zeigt den Namen des Datums an, auf dem die Koordinatensystemprojektion basiert (z. B. North American 1983 (Conus)).

Geoid

Zeigt den Namen des Geoid-Modells an, das im Projekt verwendet wird (z. B. GEOID96 (Continental US)).

Örtl. Anpassung

Zeigt den Namen aller örtlichen Anpassungsdefinitionen für das Projekt an.


Projektions-Feldcodes

 Überblick und weitere Informationen

Projektions-Feldcodes bieten Zugriff auf spezifische Details der Projektion, die innerhalb des Koordinatensystems für das Projekt verwendet wird. Verwenden Sie diese Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS: Jeder dieser Projektions-Feldcodes kann mit dem Präfix $Projektion versehen werden. Der Feldcode [$Projektion.Name] zeigt z. B. den Namen des Koordinatensystems an, das für das Projekt verwendet wird.

Obwohl diese Feldcodes nicht mit einem Präfix $Projektion versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden.

Name

Zeigt den Namen des Projektionstyps an (z. B. Transversal-Mercator).

Die übrigen Projektions-Feldcodes stellen Parameterwerte für verwendete Projektprojektion dar.

HINWEIS:  Nicht alle Feldcodes sind für alle Projektionstypen gültig. Das heißt, nicht alle Feldcodes sind uneingeschränkt gültig. Die folgende Liste von Feldcodes enthält eine vollständige Aufstellung aller darstellbaren Projektionsparameter. Abhängig von der Projektion, die jeweils vom Projekt verwendet wird, werden nur Werte für die geeigneten Feldcodes dargestellt. Alle Feldcodes, die für das Projekt nicht gültig sind, werden als 'Nicht vorhanden' angegeben (was Nicht verfügbar bedeutet).

Jeder der folgenden Feldcodes zeigt den detaillierten Wert an:

Falscher Hochwert

Der falsche Hochwert für die Projektion.

Falscher Rechtswert

Der falsche Rechtswert für die Projektion.

Falsche Höhe

Der Ellips. Höhenwert am Ursprung einer Ebenen-Projektion.

Ursprung Breite

Die Ursprungsbreite für die Projektion.

Ursprung Länge

Die Ursprungslänge für die Projektion.

Ursprung Ellips. Höhe

Die ellipsoidische Höhe am Ursprung einer Ebenen-Projektion.

Maßstabsfaktor

Der Basis-Maßstabsfaktor für die Projektion (auf Einheiten basierend).

Azimut

Der Diagonalazimut-Wert für die Projektionen Schräger Mercator- und R.S.O. mit einer Diagonalazimut-Definition.

Konvergenz

Der Diagonalazimut-Wert für die Projektionen Schräger Mercator- und R.S.O. mit einer Diagonal-Konvergenzursprungs$-Definition.

Parallele 1

Die Nordparallele, die in der Definition der Lambert 2 Parallelen und Albers Gleiche Fläche Konischen Projektion  verwendet wird.

Parallele 2

Die Südparallele, die in der Definition der Lambert 2 Parallelen und Albers Gleiche Fläche Konischen Projektion  verwendet wird.

Punkt 1 Breite, Punkt 1 Länge, Punkt 2 Breite, Punkt 2 Länge

Diese vier Feldcodes werden von den Schräger Mercator- und R.S.O.-Projektionen verwendet, die durch zwei Punkte definiert sind, wobei diese Felder die Definition der Punktpositionen sind.


Datum-Feldcodes

 Überblick und weitere Informationen

Die Datum-Feldcodes ermöglichen den Zugriff auf spezifische Datum-Details des Koordinatensystem-Datums, das für das Projekt verwendet wird. Verwenden Sie diese Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS: Jeder dieser Datum-Feldcodes kann mit dem Präfix $Datum versehen werden. Der Feldcode [$Datum.Methode] zeigt z. B. den Namen der Datum-Methode an, die für das Projekt verwendet wird.

Obwohl diese Feldcodes nicht mit einem Präfix $Datum versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden.

HINWEIS: Nicht alle Feldcodes sind für alle Datum-Typen gültig. Das heißt, nicht alle Feldcodes sind uneingeschränkt gültig. Die folgende Liste von Feldcodes enthält eine vollständige Aufstellung aller darstellbaren Datum-Parameter. Abhängig vom Datum, das jeweils vom Projekt verwendet wird, werden nur Werte für die geeigneten Feldcodes dargestellt. Alle Feldcodes, die für das Datum nicht gültig sind, werden als 'Nicht vorhanden' angegeben (was Nicht verfügbar bedeutet).

Jeder der folgenden Feldcodes zeigt den detaillierten Wert an:

Methode

Der Name der verwendeten Datum-Transformationsmethode (z. B.  Drei Parameter).

Verschiebung X

Der X-Verschiebungswert (verfügbar für Drei- und Sieben Parameter-Datum-Transformationen).

Verschiebung Y

Der Y-Verschiebungswert (verfügbar für Drei- und Sieben Parameter-Datum-Transformationen).

Verschiebung Z

Der Z-Verschiebungswert (verfügbar für Drei- und Sieben Parameter-Datum-Transformationen).

Rotation X

Der X-Rotationswert (verfügbar nur für Sieben Parameter-Datum-Transformationen).

Rotation Y

Der Y-Rotationswert (verfügbar nur für Sieben Parameter-Datum-Transformationen).

Rotation Z

Der Z-Rotationswert (verfügbar nur für Sieben Parameter-Datum-Transformationen).

Maßstabsfaktor

Der Maßstabsfaktorwert der Sieben Parameter-Datum-Transformation, angegeben in Teilen pro Million.

Ellipsoidname

Der Name des im Projekt verwendeten Ellipsoids.

Abplattung des Ellipsoids

Die Abplattung des Ellipsoids.

Große Halbachse

Die große Halbachse des Ellipsoids.


Kalibrierungs-Feldcodes

 Überblick und weitere Informationen

Die Kalibrierungs-Feldcodes bieten Zugriff auf spezifische Details der GPS-Kalibrierung, die im Koordinatensystem für das Projekt verwendet wird. Verwenden Sie diese Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

HINWEIS: Jeder dieser Projekt-Feldcodes kann mit dem Präfix $Kalibrierung versehen werden. Der Feldcode [$Kalibrierung.Rotation] zeigt z. B. den Rotationswert für die Ebenen-Transformation in der GPS-Kalibrierung an.

Obwohl diese Feldcodes nicht mit einem Präfix $Kalibrierung versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden.

HINWEIS: Die Kalibrierungs-Feldcodes sind in zwei Gruppen eingeteilt, die sich auf die horizontalen bzw. vertikalen Komponenten einer GPS-Kalibrierung beziehen. Alle Feldcodes in beiden Gruppen sind gültig, wenn die jeweilige Komponente berechnet worden ist. Das heißt, die vertikalen Kalibrierungskomponenten sind gültig, wenn die vertikale Kalibrierung im Koordinatensystem zur Verfügung steht. Die folgende Liste mit Feldcodes enthält die vollständige Liste aller Kalibrierungsparameter, die angegeben werden können. Alle Feldcodes, die für die Kalibrierung nicht gültig sind, werden als 'Nicht vorhanden' angegeben (was Nicht verfügbar bedeutet).

Jeder der folgenden Feldcodes zeigt den detaillierten Wert an:

Vt.  Ursprung Hochw

Der Ursprungs-Hochwert der vertikalen Transformation.

Vt.  Ursprung Rechtsw

Der Ursprungs-Rechtswert der vertikalen Transformation.

Vt. konst.  Korrektur

Die vertikale Verschiebung, die an dem Ursprungspunkt der Transformation angewendet wird.

Vt.  Korrektur Hoch

Die vertikale Korrektur pro Hochwert-Einheit, die in der Transformation angewendet wird.

Vt.  Korrektur Rechts

Die vertikale Korrektur pro Rechtswert-Einheit, die in der Transformation angewendet wird.

Hz.  Ursprung Hochw

Der Ursprungs-Hochwert der horizontalen Transformation.

Hz.  Ursprung Rechtsw

Der Ursprungs-Rechtswert der horizontalen Transformation.

Hz.  Verschiebung Hoch

Der auf die Nordrichtung angewandte horizontale Verschiebungswert.

Hz.  Verschiebung Rechts

Der auf die Ostrichtung angewandte horizontale Verschiebungswert.

Maßstabsfaktor

Der in der horizontalen Transformation angewandte Maßstabsfaktor (auf Einheiten basierend).

Rotation

Die auf die horizontale Transformation angewandte Rotation.


Spezial-Feldcodes

 Überblick und weitere Informationen

Diese Spezial-Feldcodes ermöglichen Zugriff auf eine Reihe von Computer-Details und bieten eine Reihe spezieller Funktionen. Verwenden Sie diese Feldcodes, um zusätzliche Informationen zu Berichten hinzuzufügen.

$Datei.Dateiname

Dieser Feldcode zeigt den Inhalt der festgelegten Datei an.

HINWEIS: Aufgrund eines Konflikts mit dem in einigen Feldcode-Definitionen verwendeten Doppelpunktzeichen können Sie das Zeichen Doppelpunkt (:) nicht verwenden, um einen Buchstaben für ein Computerlaufwerk zu definieren. Wenn Sie ein Laufwerk angeben müssen, verwenden Sie <drive> anstelle von 'Laufwerk:' Verwenden Sie z. B. <C> , um das C: Laufwerk anzugeben.

Trimble Geomatics Office verwendet einige Spezial-Feldcodes für die Angabe standardmäßiger Verzeichnisse.

$Basisverzeichnis (in dem sich die Datei TGOffice.exe befindet)

$System (das System-Unterverzeichnis unter $Basisverzeichnis, in dem sich die Datei TGOffice.exe befindet)

$Projekt (das aktuelle Projektverzeichnis)

Z. B. [$DATEI.<c>\temp\data.txt] oder [$Datei.$system\myfile.txt]

HINWEIS: Sie können hier auch die Option 'Expandieren' verwenden.

$Umg.Variablenname

Zeigt die genannte Umgebungsvariable an.

$Schlüssel.Schlüsselname

Zeigt den String mit dem vorgegebenen Schlüssel an, der einer .ini-Datei entnommen wurde (oder der Registrierung).

Das Format des Feldcodes 'Name' ist Schlüssel{,Abschnitt}{;Pfad}

Wenn der Abschnitt weggelassen wurde, wird 'Feldcode' verwendet, und wenn der Pfad weggelassen wurde, wird $System angenommen.

Wie bei dem Feldcode   $Datei, kann der Pfad mit einem der folgenden Ausdrücke beginnen:

  $Basisverzeichnis

  $System

  $Projekt

HINWEIS: Wenn der Pfad nur $Projekt ist, wird die *.ini-Datei des Projekts verwendet. (Options.ini wird zuerst überprüft, danach tgo_v160.ini — dies sind mit jedem Projekt assoziierte INI-Dateien.) Wenn der Pfad nur $System ist, wird der Trimble Geomatics Office Softwarebereich in der Registrierung verwendet.

$Text.Text

Zeigt den Text an, den Sie eingegeben haben. Dies ist bei Berichten nützlich.

[$Text.Kartiercode:20] zeigt z. B. die Beschriftung 'Kartiercode' 20 Leerstellen vom Punkt entfernt an.


Planrahmen-Feldcodes

 Überblick und weitere Informationen

Bei der Definition von Planrahmen werden mehrere Spezial-Feldcodes zur Verfügung gestellt. Verwenden Sie diese in Planrahmen-Definitionen, um plotspezifische Details darzustellen.

HINWEIS: Jeder dieser Planrahmen-Feldcodes kann mit dem Präfix $Plot versehen werden. Der Feldcode[$Plot.Maßstab] zeigt den Plot-Maßstab für das Plot an.

Obwohl diese Feldcodes nicht mit einem Präfix $Plot versehen werden müssen, sollten Sie dieses Präfix verwenden, um Mehrdeutigkeiten zu vermeiden.

Maßstab

Zeigt den Plot-Maßstab für das Plot an.

Name erste Ursprungs-Ordinate

Zeigt den Namen der ersten Ursprungs-Ordinate an. Stellen Sie diese z. B. mit der Option Datei / Projekteigenschaften / Einheiten und Format / Koordinatenreihenfolge auf Hochwert zuerst ein. Der Feldcode [$Plot.Name erste Ursprungs-Ordinate] zeigt 'Hochwert' an.

Name zweite Ursprungs-Ordinate

Zeigt den Namen der zweiten Ursprungs-Ordinate an. Stellen Sie diese z. B. mit der Option Datei / Projekteigenschaften / Einheiten und Format / Koordinatenreihenfolge auf Hochwert zuerst ein. Der Feldcode [$Plot.Name zweite Ursprungs-Ordinate] zeigt 'Rechtswert' an.

Erste Ursprungs-Ordinate

Zeigt den Wert der ersten Ursprungs-Ordinate an. Stellen Sie diesen z. B. mit der Option Datei / Projekteigenschaften / Einheiten und Format / Koordinatenreihenfolge auf Hochwert zuerst ein. Der Feldcode [$Plot.Name erste Ursprungs-Ordinate] zeigt den Plot-Ursprung des Hochwerts an.

Zweite Ursprungs-Ordinate

Zeigt den Wert der zweiten Ursprungs-Ordinate an. Stellen Sie diesen z. B. mit der Option Datei / Projekteigenschaften / Einheiten und Format / Koordinatenreihenfolge auf Hochwert zuerst ein. Der Feldcode [$Plot.Name zweite Ursprungs-Ordinate] zeigt den Plot-Ursprung des Rechtswerts an.

Ursprung Ho

Zeigt den Plot-Ursprung des Hochwerts an.

Ursprung Re

Zeigt den Plot-Ursprung des Rechtswerts an.

Rotation

Zeigt die für den Plot festgelegten Rotationswerte an.

Planrahmen

Zeigt den Namen des Planrahmens, wie in der Planrahmen-Definition angegeben, an.


Zusatzoptionen

 Überblick und weitere Informationen

Feldcode-Zusatzoptionen sind spezielle Befehle, die Sie verwenden können, um die Ausgabe eines Feldcodes zu modifizieren.

Verwenden Sie Zusatzoptionen, um:

  die spezifische Ausgabe zu erhalten, die Sie von dem Feldcode benötigen

  zusätzliche Formatierungsinformationen oder zusätzliche Parameter zur bei der Ausgabe von Daten Verfügung zu stellen

Eine Reihe von Zusatzoptionen kann zur Änderung eines einzelnen Feldcodes verwendet werden. Wenn mehrere Zusatzoptionen verwendet werden, werden sie normalerweise wie folgt angegeben:

	[Feldcode{:Formatelement}{:Formatelement}{:Formatelement}{:Formatelement}]
wobei FormatElement entweder eine Zusatzoptionsbezeichnung oder ein Format-Layout ist. Die geschweiften Klammern weisen darauf hin, daß dies optionale Elemente sind.

Wenn Sie eine Zusatzoption angeben, akzeptiert das System entweder Klein- oder Großbuchstaben oder Klein- und Großbuchstaben.

Mögliche Zusatzoptionen sind:

Breite (numerisch)

Bestimmt die Ausgabebreite eines Feldcodes. Wenn der Breitenwert negativ ist, ist die Ausgabe linksbündig, andernfalls ist sie rechtsbündig.

Wenn Kartiercode = "Stichproben-Code" ist, dann zeigt der Feldcode [Kartiercode:15] " Stichproben-Code" an (das bedeutet, er wird durch Hinzufügen von vier vorangestellten Leerzeichen auf 15 Zeichen ausgedehnt).

Breite.Dezimalstellen (numerisch)

Bestimmt sowohl die Breite als auch die Anzahl der Dezimalstellen für die Ausgabe eines Feldcodes. Die Zusatzoption hat die Form W.D, wobei W die Breite und D die Anzahl der Dezimalstellen ist.

Wenn der Breitenwert negativ ist, ist das Feld linksbündig, andernfalls ist es rechtsbündig.

Ist dem Breitenwert eine Null vorangestellt, auch wenn der Wert nicht Null ist, (z. B. 08,3), dann wird mit einer Null und nicht mit einer Leerstelle aufgefüllt.

Wenn z. B.	die  Höhe = 10.3258 ist,

dann zeigt der Feldcode	[Höhe:0.3] 10.326

und	[Höhe:07.2] 0010.33 an.

Einheiten

Fügt Werten ein Suffix mit den entsprechenden Einheiten zu. So wird z. B. m für Meter, ift für Internationale Fuß und sft für US-Vermessungs-Fuß verwendet. Sie können diese Zusatzoption verwenden, um sicherzustellen, daß Einheiten angezeigt werden, selbst wenn die Option Einheiten anzeigen unter Datei / Projekteigenschaften / Register Einheiten und Format auf Nein eingestellt ist.

Keine Einheiten

Stellt sicher, daß Werten kein Suffix mit den entsprechenden Einheiten hinzugefügt wird. Sie können diese Zusatzoption verwenden, um sicherzustellen, daß keine Einheiten angezeigt werden, selbst wenn die Option Einheiten anzeigen unter Datei / Projekteigenschaften / Register Einheiten und Format auf Ja eingestellt ist.

Großbuchstaben

Konvertiert alle alphabetischen Zeichen, die von einem Feldcode ausgegeben werden, in Großbuchstaben.

Kleinbuchstaben

Konvertiert alle alphabetischen Zeichen, die von einem Feldcode ausgegeben werden, in Kleinbuchstaben.

Rechts

Ordnet einen Feldcode innerhalb der festgelegten Feldbreite rechtsbündig an. Wird keine Feldbreite bestimmt, findet keine Zentrierung statt.

Links

Ordnet einen  Feldcode innerhalb der festgelegten Feldbreite linksbündig an. Wird keine Feldbreite bestimmt, findet keine Zentrierung statt.

Zentriert

Ordnet einen Feldcode innerhalb der festgelegten Feldbreite zentriert an. Wird keine Feldbreite bestimmt, findet keine Zentrierung statt.

Wenn z. B. der Kartiercode = "Beispiel" ist,

dann zeigt der Feldcode [Kartiercode:11:Zentriert] "  Beispiel  " an.

Das heißt, die Ausgabe wird in diesem Fall mit zwei voran- und zwei nachgestellten Leerzeichen dargestellt.

Kürzen

Kürzt die Ausgabe auf die vorgegebene Breite (führend/hängend, wenn die Breite positiv oder negativ ist).

Wenn z. B. Kartiercode = Beispiel ist

dann zeigt der Feldcode [Kartiercode:4:Kürzen] 'Bei'

und [Kartiercode: - 4:Kürzen] 'spiel' an.

Expandieren

Expandiert alle Feldcodes, die in dem Text als Feldcode, auf den die Option  'Expandieren' zutrifft, ausgegeben wurden.

Der Feldcode [$Datei.$System\text.txt:expand] expandiert z. B. wenn er beim Importieren einer Datei verwendet wird, alle gültigen Feldcodes, die in der Text.txt-Datei gefunden werden, bevor er diese anzeigt.

Standard

Konvertiert die Ausgabe in standardmäßige numerische Satzzeichen (Punkt für Dezimalsymbol und keine Ziffer für Tausender-Trennzeichen; das bedeutet, kein Trennsymbol pro tausend).

HINWEIS: Diese Zusatzoption wird nur auf Berichtsdefinitionen angewendet. Die Import-Routinen können numerische Daten in standardisierter Form (kein Ziffern-Gruppierungssymbol und einen Punkt als Dezimaltrennzeichen) oder Werte empfangen, die das im Microsoft Windows festgelegte Ziffern-Gruppierungssymbol und Dezimalzeichen verwenden. Die Export-Routinen konvertieren numerische Ausgaben in die standardisierte Form.

Umgekehrt

Bildet den Umkehrwert des entsprechenden Feldcodes. Der Feldcode [Azimut:Umgekehrt] bildet den Umkehrwert des Azimuts, der normalerweise für eine angegebene Linie dargestellt werden würde.

Quadrant

Zeigt einen Azimut als einen Quadrantwinkel an. Ein Azimut von 228°37'25" erscheint z. B. als N81°22'35"W.

Ganzer Kreis

Zeigt einen Azimut als Vollkreiswinkel an. Wenn Ihr Azimut-Format z. B. auf Quadrantwinkel Nord 81 Grad, 22 Minuten und 35 Sekunden West eingestellt ist, erscheint dieses als 228°37'25".

Wörtlich

Verwendet den vollständigen Wortlaut, wo zutreffend. Wenn Einheiten z. B. auf 'm' abgekürzt sind, verwenden Sie die Zusatzoption Wörtlich, um das Wort 'Meter' anzeigen zu lassen.

Spalten

Teilt den String am Dezimalpunkt.

Die Zusatzoption [Höhe:Spalten] gibt z. B. die Höhe ohne das Dezimalzeichen an.

HINWEIS: Diese Zusatzoption ist für die Punktanmerkungsposition Auf nützlich, wenn Sie Anmerkungsmuster entwerfen.

Sie ersetzt den '.' mit einem einzelnen Leerzeichen. Sie können diesen Wert erhöhen, indem Sie z. B. :spalten<3> verwenden.

GanzzAnt

Entfernt den Bruchzahlteil des Wertes (bis zu '.').

BruchAnt

Entfernt den ganzzahligen Teil des Wertes (von '.').

Implizit

Handhabt den Import und Export von ASCII-Dateien, bei denen der Dezimalpunkt nicht in numerischen Werten vorhanden, aber seine Position implizit ist. Die Zusatzoption wird in Verbindung mit den Zusatzoptionen für Standardbreite und Dezimalstellen verwendet.

Der Feldcode [Hochwert:10.3:Impliziert] würde z. B. den Hochwert 4853297.692 als 4853297692 ausgeben. Die gleiche Feldcode-Definition ermöglicht die Interpretation von Werten, bei denen die Dezimalzeichen beim Importieren implizit sind.


Format-Layouts

 Überblick und weitere Informationen

Mit Hilfe der Format-Layouts erzeugen Sie Feldcodes.

Sie können z. B. einen Feldcode für ein Datum erzeugen, indem Sie folgende Format-Layout-Komponenten verwenden:

[Datum:<{TTTT}, {MMM} {T}-{JJJJ}!>]

Dies ergibt Sonntag, Okt 17 1999!

HINWEIS: Sie können einen beliebigen Text in den Feldcode einschließen. Im obigen Beispiel wurde ein Ausrufungszeichen mit eingeschlossen.

Format-Layouts werden immer von Winkelklammern (< >) (für vollständige Format-Layouts) oder geschweiften Klammern ({ }) (für Bestandteile eines Format-Layouts) umschlossen.

Format-Layouts werden nur auf bestimmte Datentypen angewendet. Diese sind:

  Format-Layouts für Datum

  Format-Layouts für Zeit

  Format-Layouts für Winkel/Richtungswinkel.

Die Optionen Datum und Zeit stellen nur Komponenten für ein Format-Layout zur Verfügung, während Winkel/Richtungswinkel komplette Format-Layouts bieten.


Format-Layouts für Datum

 Überblick und weitere Informationen

Die Format-Layouts für Datum ermöglichen die Kontrolle über die Darstellung der Datumskomponente eines Feldcodes. Ein Datum-Feldcode, der die Komponente tt enthält, kann z. B. das Datum mit einer vorangestellten Null darstellen.

HINWEIS: Stichproben-Datumsformat-Layouts, die repräsentative Werte verwenden, sind im Verknüpfungsmenü Felder / Fortgeschritten / Mehr / Option Format-Layouts verfügbar. Diese Beispiele werden automatisch konvertiert, um die hier im einzelnen aufgelisteten Feldcodes zu verwenden.

Nachfolgend ist eine vollständige Liste der verfügbaren Datum-Format-Layouts dargestellt:


Format-Layouts für Zeit

 Überblick und weitere Informationen

Die Format-Layouts für Zeit ermöglichen die Kontrolle über die Darstellung der Zeitkomponente eines Feldcodes. Ein Zeit-Feldcode, der die Komponente hh enthält, stellt eine Stunde mit einer vorangestellten Null dar (12-Stunden-Anzeige).

HINWEIS: Stichproben-Zeitformat-Layouts, die repräsentative Werte verwenden, sind im Verknüpfungsmenü Felder / Fortgeschritten / Mehr / Option Format-Layouts verfügbar. Diese Beispiele werden automatisch konvertiert, um die hier im einzelnen aufgelisteten Feldcodes zu verwenden.

Die vollständige Liste der verfügbaren Zeitformat-Layout-Typen ist:

HINWEIS:  Die Tageszeit-Komponenten des Format-Layouts müssen geordnet sein, wobei Stunden vor Minuten vor Sekunden und Millisekunden sowie t oder tt an letzter Stelle stehen. Sie können diese Formatierungselemente alle weglassen.

Datums- und Zeitkomponenten können zugleich für Datum- und Zeit-Feldcodes verwendet werden. Die angegebenen Daten enthalten die gesamten Informationen. Der Buchstabe der Komponenten ist für die Unterscheidung zwischen Minuten (m) und Monaten (M) wichtig.

Beispiele:

<TTTT, MMM T, JJJJ!> ergibt z. B.  ‘Donnerstag, Okt 14 1999!’  als aktuelles Datum.

<hh mm sstt!> ergibt z. B. ‘01 02 07pm!’  als aktuelle Zeit.


Winkel / Richtungswinkel-Format-Layouts
Format-Layouts für Winkel / Richtungswinkel

 Überblick und weitere Informationen

Die Format-Layouts für Winkel/Richtungswinkel ermöglichen die Kontrolle über die Darstellung der Winkel/Richtungswinkel-Komponente eines Feldcodes. Wenn z. B. der Azimut-Feldcode die Komponente <gm.mm> enthält, wird der Azimut in Grad und Dezimalminuten dargestellt.

HINWEIS: Die Format-Layouts für Winkel/Richtungswinkel sind unter Felder / Fortgeschritten / Mehr / Option Format-Layouts verfügbar.

Die verfügbaren Typen von Format-Layouts für Winkel/Richtungswinkel sind:

Dezimale Sekunden

Zeigt Winkel/Richtungswinkel unter Verwendung von Grad, Minuten und Dezimalsekunden an (wenn die Winkeleinheiten auf Grad eingestellt sind). Dieses Format-Layout fügt die Layout-Zeichen <gms.ss> ein. [Azimut:0.3:<gms.ss>] zeigt z. B. einen Azimutwert auf drei Dezimalstellen einer Sekunde an.

Dezimale Minuten

Zeigt Winkel/Richtungswinkel unter Verwendung von Grad und Dezimalsekunden an(wenn die Winkeleinheiten auf Grad eingestellt sind). Dieses Format-Layout fügt die Layout-Zeichen <gm.mm> ein. [Azimuth:0.4:<dm.mm>] zeigt z. B.  einen Azimutwert auf vier Dezimalstellen einer Minute an.

Dezimale Grad

Zeigt Winkel/Richtungswinkel unter Verwendung von Dezimalgrad an (wenn die Winkeleinheiten auf Grad eingestellt sind). Dieses Format-Layout fügt die Layout-Zeichen <g.gg> ein. [Azimut:0.6:<g.gg>] zeigt z. B. einen Azimutwert auf sechs Dezimalstellen eines Grads an.

Dezimale Grad mit Vorzeichen

Zeigt Winkel/Richtungswinkel unter Verwendung von Dezimalgrad an (wenn die Winkeleinheiten auf Grad eingestellt sind) und dem Wert ist ein Vorzeichen vorangestellt. Dieses Format-Layout fügt die Layout-Zeichen <+g.gg> ein. [Breitengrad<+g.gg>:0.8] zeigt z. B. einen Breitengradwert auf acht Dezimalstellen eines Grads einschließlich des vorangestellten Vorzeichens (+ oder -) für den Wert an.


Feldcode-Ersetzung

 Überblick und weitere Informationen

Die Feldcode-Ersetzung erkennt einige spezielle Feldcode-fremde Zeichenfolgen. Diese werden wie folgt dargestellt:

Beispiele:

Verwenden Sie die folgenden Feldcodes, um ein ASCII-Ausgabeformat mit Tabulatoren als Trennzeichen zu erzeugen:

[Name]\t[Rechtswert]\t[Hochwert]\t[Höhe]\t[Kartiercode]

Verwenden Sie die folgenden Feldcodes, um eine Linie mit Azimut und Strecke auf zwei verschiedenen Zeilen anzumerken:

[Azimut]|[Strecke]


Feldcodes und ASCII-Import

 Überblick und weitere Informationen

Die in einem Importformat zugelassenen Feldcodes sind:

  Nur Felder in den Punktetabellen.

  Keine Unterdatensätze und keine System-Feldcodes.

(Eine zulässige Ausnahme ist [$System.Wiederholen<Suchen><Ersetzen>].)

Einige berechnete Felder sind zulässig (z. B.  Breitengrad/Längengrad).

$Überspringen

Es gibt einen speziellen Bereich ($Überspringen), der bei der Interpretation der ASCII-Eingabe behilflich ist:

Leerzeichen

Dieser Feldcode überspringt die Anzahl der Leerstellen, die durch die Breite vorgegeben sind oder springt zu einem Zeichen, wenn keine Breite vorgegeben ist. Sie müssen sicherstellen, daß Sie ein Leerzeichen vor dem Überspringen plazieren, damit Trimble Geomatics Office erkennt, wo das vorherige Feld aufhört, z. B.:

[Name] [$Überspringen.Leerzeichen][Hochwert] [$Überspringen.Leerzeichen][Rechtswert] [$Überspringen.Leerzeichen]

Zahl

Dieser Feldcode überspringt eine Zahl (Zeichen '+', ' - ', '.' & '0'...'9'). Wenn eine Breite vorhanden ist, überspringt er die entsprechende Anzahl von Zeichen; andernfalls springt er zu dem ersten Zeichen über, das keine Zahl darstellt.

HINWEIS: Dieses funktioniert nicht im Zusammenhang mit NULL oder Zahlen in Exponentialdarstellung.

Linie

Dieser Feldcode überspringt die Anzahl der Zeilen, die durch die Breite vorgegeben sind oder eine Zeile.

Text

Dieser Feldcode überspringt die vorgegebene Anzahl von Zeichen oder springt zu einem Zeichen, das nicht gedruckt wird (z. B. '\n').

Spalte

Dieser Feldcode springt zu der vorgegebenen Spaltennummer.

Zu:Text

Dieser Feldcode springt zum ersten Zeichen im Anschluß an die vorgegebene Zeichenfolge (z. B. [$Überspringen.Zu:ELEMENTE]).

HINWEIS: Die Zeichenfolge kann keine Zeilenvorschübe enthalten.

Es gibt einige spezielle 'Formatfunktionen':

Standard

Diese Zusatzoption konvertiert die Eingabe der Standard-Interpunktion: '.' wird als Dezimaltrennzeichen dargestellt.

Überspringen

Diese Formatfunktion liest das Feld wie gewöhnlich, speichert es jedoch nicht (z. B. [Punkt.Horz Gen:10.3:überspringen]).

= (Wert)

Diese Zusatzoption weist mit Hilfe der übrigen Format-Zeichenfolge dem Feld einen Wert zu. Sie berücksichtigt nicht die Datei (z. B. [Kartiercode:=importiert]). Diese Felder müssen am Anfang der Feldcode-Zeichenfolge stehen (ansonsten gibt es Unklarheiten beim Lesen), z. B.  '[Höhe:=0.0][Name],[Hochwert],[Rechtswert]'

HINWEIS:  Beim Definieren eines ASCII-Importformats ist es wichtig, daß Sie entweder die Breite in einem Feldcode (z. B. [WGS-Breite:11]) oder das Trennzeichen zwischen den Feldcodes angeben (z. B. [WGS-Breite],[WGS-Länge],[WGS-Höhe], wobei die Kommata das Ende der 'Felder' anzeigen). Somit werden die Import-Routinen bei der Interpretation der Werte in einer ASCII-Datei die Formatdefinition verwenden, um den Teil jeder Dateizeile zu ermitteln, der in ein vorgegebenes Datenbankfeld einzulesen ist. Die Breite oder Trennzeichen ermöglichen es, die entsprechenden Anteile der Dateizeilen zu ermitteln.

HINWEIS: Fügen Sie das folgende Zeitformat-Layout <H:mm:ss.nnn> zum Feldcode hinzu, um Ereigniszeiten auf die Millisekunde genau darzustellen, wobei nnn die Anzahl der Dezimalsekunden ist. Beispiel: [Punktbeob.Zeit:<H:mm:ss.nnn>]. Erhöhen Sie die Anzahl der Dezimalsekunden, um die Zeitgenauigkeit zu verbessern. So gibt z. B. nnnn die ersten 4 Dezimalsekunden aus.


Dialogfeld Feldcode-Parameter

Verwenden Sie dieses Dialogfeld, um den Feldcode abzuschließen. Der Titel des Dialogfelds weist auf den Kontext hin.

Name

Diese Spalte zeigt den/die zu definierenden Parameter an.

Wert

Geben Sie den/die benötigten Wert(e) ein.


Dateien zu Trimble Survey Controller übertragen - Überblick
Dateien zu Trimble Survey Controller übertragen − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld
Überblick

Sie können Dateien, die Sie im Feld benötigen, zum Trimble Survey Controller übertragen. Hierzu muß das Survey Controller-Gerät im Data Transfer-Programm eingestellt sein.

Sie können folgende Dateitypen übertragen:

  Antennen-Dateien

  Datum-Gitternetz-Dateien (*.cdg)

  Datenrekorder-Dateien (*.dc)

  Attribut-Verzeichnis-Dateien (*.ddf)

  DGM-Punkte

  Merkmals- und Attributbibliotheken (*.fcl)

  Geoid-Gitternetz-Dateien (*.ggf)

  UK-National Grid-Dateien (*.pgf)

  CSV-Dateien

  Hintergrundkarten-Dateien


Option Antennendetails zu Survey Controller

Wenn Sie Antenneninformationen in einer Antennendatei bearbeitet haben, verwenden Sie diese Option, um diese Informationen zu Trimble Survey Controller zu übertragen.

  Bei der Trimble Survey Controller-Version 6.00 oder höher werden die Antennendetails in der Datei Antenna.ini gespeichert.

  Bei der Trimble Survey Controller-Version 5.03 oder niedriger werden die Antennendetails in der Datei Antenna.dat gespeichert.

HINWEIS: Um Antennendetails zu exportieren, muß die entsprechende Antennendatei im Ordner Programme\Gemeinsame Dateien\Trimble\Config enthalten sein.


Option Survey Controller-Dateien (*.dc)

Survey Controller (*.dc)-Dateien stellen die Verbindung zwischen Trimble Geomatics Office und Trimble Survey Controller dar. Diese Dateien werden erzeugt, wenn Sie ein Projekt von Trimble Survey Controller importieren, oder wenn Sie ein Trimble Geomatics Office-Projekt in dieses Dateiformat exportieren.

Mit Trimble Geomatics Office können Sie:

  eine Survey Controller-Datei (*.dc) importieren

  ein Trimble Geomatics Office-Projekt in eine Survey Controller-Datei (*.dc) exportieren, um sie später zu Trimble Survey Controller zu übertragen

So importieren Sie eine Survey Controller-Datei (*.dc):

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Survey Controller-Dateien (*.dc). Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die Datei, die Sie importieren möchten, aus einem Ordner, und klicken Sie auf Öffnen.

So exportieren Sie das aktuelle Trimble Geomatics Office-Projekt in eine Survey Controller-Datei (*.dc):

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Survey Controller-Dateien (*.dc).

4.	Klicken Sie auf Optionen, um das Dialogfeld Datenrekorder-Einstellungen zu öffnen und den internen Namen der Datei und die Survey Controller-Dateiversion festzulegen.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

7.	Wählen Sie den Ordner, in dem die Datei gespeichert werden soll.

8.	Als Voreinstellung für den Dateinamen wird der Projektname angenommen. Geben Sie einen Namen in das Feld Dateiname ein, um ihn zu ändern, und klicken Sie auf Speichern.


Option Survey Controller

Mit Trimble Geomatics Office können Sie Daten direkt zwischen einem Trimble Geomatics Office-Projekt und Trimble Survey Controller übertragen. Wenn ein Projekt aus dem Trimble Survey Controller importiert wird, wird es in ein Survey Controller-Datei (*.dc)-Format konvertiert, das von Trimble Geomatics Office verwendet wird.

Verwenden Sie die Trimble Geomatics Office, um:

  ein Projekt von Trimble Survey Controller zu importieren

  ein Trimble Geomatics Office-Projekt zu Trimble Survey Controller zu exportieren

So importieren Sie ein Survey Controller-Projekt in ein Trimble Geomatics Office-Projekt:

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Vermessungsgerät, und klicken Sie auf OK. Das Dialogfeld Data Transfer Öffnen erscheint.

So exportieren Sie ein Trimble Geomatics Office-Projekt zum Survey Controller:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Vermessungsgeräte.

4.	Klicken Sie auf Optionen, um das Dialogfeld Datenrekorder-Einstellungen zu öffnen und den internen Namen der Datei und die Survey Controller-Dateiversion festzulegen.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

7. 	Wählen Sie ein Survey Controller-Gerät.

8.	Klicken Sie auf Öffnen. Der Computer stellt eine Verbindung zum Trimble Survey Controller her.

9.	Wählen Sie die Option Hauptspeicher oder Survey Data Card (falls verfügbar).

10.	Klicken Sie auf Öffnen. Die Software liest den von Ihnen gewählten Ordner und zeigt alle Trimble Survey Controller-Projekte in dem Ordner an.

11.	Geben Sie in das Feld Dateiname den Namen der neuen .dc-Datei ein.

12.	Klicken Sie auf Speichern, um die .dc-Datei zu erzeugen und sie zu Trimble Survey Controller zu übertragen.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller-Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.


Dialogfeld Datenrekorder-Einstellungen

Verwenden Sie dieses Dialogfeld, um das Gerät festzulegen, zu dem die Daten exportiert werden sollen.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie eine der folgenden Optionen:

  DGM-Punkte zu Datei

  DGM-Punkte zu Survey Controller

  Merkmals- und Attributbibliothek direkt zu Survey Controller

  SDR-Dateien

  Survey Controller

  Survey Controller-Dateien

4.	Klicken Sie auf Optionen.

HINWEIS: Die verfügbaren Felder hängen von der gewählten Option ab.

Version

Wählen Sie die entsprechende Version des Datenformats.

Projekt- / Dateiname

Zeigt den Namen des zu exportierenden Projekt- oder Dateityps an. Wenn ein Projekt exportiert wird, wird als Vorgabe der Name des Trimble Geomatics Office-Projekts eingegeben. Verwenden Sie die Tastatur, um einen neuen Namen für die Datei einzugeben.

Merkmale und Attribute ausgeben

Wählen Sie dieses Kontrollkästchen, um die Merkmals- und Attributbibliothek des Projekts und alle Merkmals- und Attributinformationen der Punkte im zu exportierenden Projekt zu übertragen. Diese Option ist nur verfügbar für Trimble Survey Controller 7.00 oder höher.

Linien und Bögen exportieren

Wählen Sie dieses Kontrollkästchen, um im Projekt verwendete Linien und Bögen zum Trimble Survey Controller zu exportieren. Diese Option ist nur verfügbar, wenn Linien und Bögen in der Auswahlmenge enthalten sind, und steht darüber hinaus für Trimble Survey Controller-Versionen 10.00 oder höher zur Verfügung.

Ausgabe als

Wählen Sie die Punktausgabe für die Geräte-Datei.

Die Ausgabe kann als WGS-84- oder Gitter-Positionen erfolgen. Abhängig vom Datenformat und der Version, die Sie auswählen, sowie von der Definition des Datenbank-Koordinatensystems, stehen die beiden Optionen nicht immer zur Verfügung. Beispiel: Trimble Survey Controller niedriger als Version 4.00 akzeptiert nur WGS-84-Positionen; Sokkia SDR20-Versionen akzeptieren nur Gitter-Positionen.

Das Koordinatensystem des Projekts kann die Datenausgabe in die Trimble Survey Controller-Dateien beeinflussen. Die Datum-Gitternetz- (z. B. NAD83 HPGN und NADCON) und Mehrfachregressions-Datumtransformationsmethoden werden von der Trimble Survey Controller-Version 6.50 oder niedriger nicht unterstützt. Die Trimble Survey Controller Version 7.00 unterstützt Datum-Gitternetze.

Wenn Daten zum Trimble Survey Controller exportiert werden, die die im Projekt festgelegte Datumtransformationsmethode nicht unterstützen, wird die Datum-Methode im Datum-Datensatz in der erzeugten .dc-Datei auf Keine eingestellt. Die inkorrekten Gitterpositionen können in Trimble Survey Controller nicht dargestellt werden. Weitere Informationen finden Sie unter dem Thema Datum-Transformationen und Trimble Survey Controller.

Ebenso kann die Trimble Survey Controller-Version 4.00 nicht mit Geoidmodellen arbeiten. Wenn ein Projekt ein Geoidmodell verwendet, wird die Datum-Methode ebenfalls auf Keine eingestellt. Dies stellt sicher, daß in der Trimble Survey Controller-Version 4.00 keine inkorrekten Daten angezeigt werden.

Wenn Sie übertragene Gitterkoordinaten-Daten im Feld verwenden möchten, müssen Sie im Feld eine Kalibrierung durchführen, um die Gitterdaten auf die beobachteten Daten zu beziehen. Weitere Informationen finden Sie unter dem Thema Geoidmodelle und Trimble Survey Controller.

Dateidetails

Wählen Sie das Kontrollkästchen Datei hinzufügen, um Daten aus einer bestehenden .dc-Datei beim Exportieren einzuschließen. Die Schaltfläche Durchsuchen wird verfügbar. Klicken Sie auf Durchsuchen, um die .dc-Datei zu finden, die in der neuen Datei enthalten sein soll. Die Daten aus dem aktuellen Projekt werden dann zur neuen Datei hinzugefügt.

Diese Option ist hilfreich, wenn Sie eine .dc-Datei haben, die Festpunkte enthält, die Sie zu den zu exportierenden Daten hinzufügen möchten. Dadurch bleibt die bestehende .dc-Datei in ihrem Originalzustand erhalten.


Datenrekorder-Einheiten

Wenn eine Trimble Survey Controller-Datei (.dc) oder eine SDR-Format-Datei importiert wird, wird die Einheitendefinition in der Kopfzeile der Datei zur Konvertierung der Einheiten verwendet. Trimble Geomatics Office arbeitet immer mit internen SI-Daten (metrisch), daher werden die von einem Gerät importierten Daten entsprechend konvertiert.

So können Sie festlegen, wie die Werte auf dem Bildschirm dargestellt werden sollen:

1.	Wählen Sie Datei / Projekteigenschaften.

Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Einheiten und Format.

Verwenden Sie dieses Register, um die Anzeige-Einheiten zu wählen.

HINWEIS: Bei  SDR-Dateien erfolgt die Einstellung für die Streckeneinheiten nur in Fuß und in Metern. Bei SDR-Dateien werden Fußwerte als US-Vermessungs-Fuß-Werte interpretiert, wenn die Werte in den Koordinaten-Einheiten auf US-Vermessungs-Fuß eingestellt sind.


Option DC-Datei-Attributnotizen (Survey Controller V4)

Attributnotizen sind einfache Dateien mit Kommas als Trennzeichen. Sie enthalten Punktattribute, die als Attributnotizen mit einem Gerät, auf dem Trimble Survey Controller (Version 3.00 oder 4.00) ausgeführt wird, aufgezeichnet wurden. Diese Option exportiert keine Attribute, die unter Verwendung einer Merkmals- und Attributbibliothek (verfügbar mit der Trimble Survey Controller-Version 7.00 oder höher) aufgezeichnet wurden.

Verwenden Sie diese Option, um ausschließlich Attribute zu exportieren, die als Notiz-Datensäte aufgezeichnet wurden. So führen Sie dies durch:

1.	Importieren Sie eine Datei aus der Trimble Survey Controller-Version 3.00 oder 4.00, die Attributnotizen enthält, in das Trimble Geomatics Office-Projekt.

Trimble Geomatics Office erzeugt eine Auswahlmenge. Diese Auswahlmenge erhält denselben Namen wie der interne Projektname der Datei.

2.	Wählen Sie die erzeugte Auswahlmenge. Die Auswahlmenge wird verwendet, um Punkte aus dem Projekt für die Attributdatei zu lesen.

3.	Exportieren Sie die .dc-Datei mit Attributnotizen.

Beispiel für einen so erzeugten Dateityp:

1000,5315.362,1056.274,82.361, BAUM,TYP,KIEFER,HOEHE,25,UMFANG,0.5

1001,5382.728,1132.692,75.472, BAUM,TYP,BIRKE,HOEHE,20,UMFANG,0.4

1002,5298.048,1162.472,55.927, PP,SPANNUNG,110KV,KABEL,3

1003,5308.682,1192.329,62.854, PP,SPANNUNG,110KV,KABEL,3


Option DGM-Punkte zu Survey Controller

Verwenden Sie diese Option, um DGM-Punkte zu einem Gerät zu exportieren, auf dem Trimble Survey Controller ausgeführt wird.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option DGM-Punkte zu Trimble Survey Controller.

4.	Klicken Sie auf Optionen, um den Namen der Datei und die Trimble Survey Controller-Version festzulegen, zu der Sie exportieren.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren, und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK. Das Dialogfeld Data Transfer Speichern unter erscheint.

Die für den Export ausgewählten Punkte müssen regelmäßig gerasterte Punkte sein. Das heißt, die Punkte müssen ein Nord-Süd- und Ost-West-Gitter bilden. Der Abstand zwischen den Punkten muß in jeder Richtung derselbe sein. Normalerweise werden die gerasterten Punkte aus einer ASCII-Datei mit Koordinaten in das System importiert. Sie müssen sicherstellen, daß nur regelmäßig gerasterte Punkte zum Exportieren ausgewählt werden und kein zusätzlicher außerhalb des Gitters liegender Punkt in der aktuellen Auswahl enthalten ist.

Nachdem die Option Exportieren gewählt wurde, sortiert das Trimble Geomatics Office-System die ausgewählten gerasterten Punkte in der entsprechenden Reihenfolge und erzeugt eine speziell formatierte Datei, die der Trimble Survey Controller benötigt.


Option DGM-Punkte zu Datei (*.dtx)

Verwenden Sie diese Option, um DGM-Punkte in eine Digitale Geländemodell-Datei (*.dtx) zu exportieren.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option DGM-Punkte zu Datei (*.dtx).

4.	Klicken Sie auf Optionen, um den Namen der Datei und die Trimble Survey Controller-Version festzulegen, zu der Sie exportieren.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren, und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK. Das Dialogfeld Speichern unter erscheint.

7.	Geben Sie den Namen für die Datei ein, und wählen Sie den Ordner, in dem Sie sie speichern möchten.

8.	Klicken Sie auf OK.

Die für den Export ausgewählten Punkte müssen regelmäßig gerasterte Punkte sein. Das heißt, die Punkte müssen ein Nord-Süd- und Ost-West-Gitter bilden. Der Abstand zwischen den Punkten muß in jeder Richtung derselbe sein. Normalerweise werden die gerasterten Punkte aus einer ASCII-Datei mit Koordinaten in das System importiert. Sie müssen sicherstellen, daß nur regelmäßig gerasterte Punkte zum Exportieren ausgewählt werden und kein zusätzlicher außerhalb des Gitters liegender Punkt in der aktuellen Auswahl enthalten ist.

Nachdem die Option Exportieren gewählt wurde, sortiert das Trimble Geomatics Office-System die ausgewählten gerasterten Punkte in der entsprechenden Reihenfolge und erzeugt die Datei im Digitalen Geländemodell (*.dtx)-Format.


Option Datum-Gitternetz zu Survey Controller (*.cdg)

Siehe auch

Verwenden Sie diese Option, um kombinierte Datum-Gitternetz-Dateien zur Übertragung zum Trimble Survey Controller zu erzeugen.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Datum-Gitternetz zu Survey Controller (*.cdg).

Das Dialogfeld Ein Datum-Gitternetz exportieren erscheint.

Datum-Gitternetz-Dateien speichern Datum-Gitternetz-Transformationen für ein definiertes Gebiet. Mit dem Coordinate System Manager-Programm können Sie ein Koordinatensystem definieren, das eine Datum-Gitternetz-Datei als Datum-Transformation für das System verwendet (z. B. NADCON). Sie können dann für Ihr Trimble Geomatics Office-Projekt ein Koordinatensystem wählen, das ein Datum-Gitternetz verwendet. Um die Datum-Gitternetz-Datei im Feld zu verwenden, müssen Sie die Datum-Gitternetz-Datei als Kombinierte Datum-Gitternetz-Datei zu Trimble Survey Controller (Version 7.00 oder höher) übertragen. Informationen darüber, welche Datum-Transformationsmethoden für unterschiedliche Trimble Survey Controller-Versionen zur Verfügung stehen, finden Sie unter dem Thema Datum-Transformationen und Trimble Survey Controller.

Es gibt eine Längengrad-Gitternetz-Datei und eine Breitengrad-Gitternetz-Datei für das von Ihnen gewählte Datum-Gitternetz im Ordner Programme\Gemeinsame Dateien\Trimble\Geodata. Diese Dateien müssen kombiniert werden, bevor sie zu Trimble Survey Controller exportiert werden. Wenn Sie die Option Eine kombinierte Datum-Gitternetz-Datei für den Export zum Survey Controller erzeugen wählen, kombiniert die Software die Dateien, die mit dem Datum-Gitternetz verknüpft sind, das im Projekt-Koordinatensystem festgelegt wurde.

Wenn Sie eine kombinierte Datum-Gitternetz-Datei erzeugen und sie im Trimble Survey Controller verwenden, wird der Name des ursprünglichen Datum-Gitternetzes in der .dc-Datei gespeichert, z. B. NADCON (HPGN).

Wenn Sie die .dc-Datei in Trimble Geomatics Office importieren, verwendet sie diesen Namen, um zu bestimmen, ob das im Feld verwendete Koordinatensystem mit dem für das Trimble Geomatics Office-Projekt definierte Koordinatensystem übereinstimmt.

HINWEIS: Sie können nur eine kombinierte Datum-Gitternetz-Datei aus der aktuell verwendeten Datum-Gitternetz-Datei erstellen, aber Sie können jedes kombinierte Datum-Gitternetz exportieren.

Sie können:

  eine bestehende kombinierte Datum-Gitternetz (.cdg)-Datei übertragen

  eine neue kombinierte Datum-Gitternetz (.cdg)-Datei für den Export zum Survey Controller erzeugen.

HINWEIS: Sie können auch das Grid Factory-Programm verwenden, um Datum-Gitternetz-Dateien zu kombinieren. Um das Grid Factory-Programm zu installieren, verwenden Sie die benutzerdefinierte Installationsoption in Trimble Geomatics Office.


Datum-Transformationen und Trimble Survey Controller

Trimble Geomatics Office unterstützt die Verwendung von Datum-Gitternetzen und Mehrfachregressions-Definitionen für Datum-Transformationen.

Die mit der Software gelieferte Koordinatensystem-Datenbank bietet eine Reihe von Koordinatensystem-Definitionen, die diese Datum-Transformationsmethoden verwenden.

Trimble Survey Controller-Versionen vor Version 7.00 unterstützen keinen dieser Datum-Transformationstypen. Die Trimble Survey Controller-Version 7.00 unterstützt Datum-Gitternetze.

Trimble Geomatics Office kann keine:

  Trimble Survey Controller .dc-Datei der Version 6.50 oder niedriger erzeugen, die eine dieser Datum-Transformationsmethoden referenziert.

  Trimble Survey Controller .dc-Datei der Version 7.00 erzeugen, die eine Mehrfachregression-Datum-Transformation referenziert.

Wenn Punkte aus einem Projekt, das eine nicht unterstützte Methode verwendet, in eine Trimble Survey Controller .dc-Datei exportiert werden, gibt Trimble Geomatics Office den Datum-Datensatz so aus, daß die Methode auf die Option Keine eingestellt ist.

Dies bedeutet, daß die Punktansicht in Trimble Survey Controller nicht zwischen WGS-84- und Gitter-Positionen umgeschaltet werden kann. Es bedeutet darüber hinaus, daß Sie nach der Übertragung von Gitter-Positionen im Feld eine Kalibrierung durchführen müssen, bevor Sie mit Hilfe dieser Punkte weitere Feldarbeiten ausführen können.

Wenn die Gitter-Positionen für Kalibrierungszwecke übertragen wurden, dann ist dies unerheblich. Wenn WGS-84-Positionen übertragen werden, können Sie sofort mit dem Abstecken beginnen. Es ist jedoch nicht möglich, die Gitter-Koordinaten anzuzeigen, bevor eine Kalibrierung im Feld durchgeführt wurde.


Dialogfeld Ein Datum-Gitternetz exportieren

Verwenden Sie diese Option, um eine Datum-Gitternetz (*.cdg)-Datei zu exportieren.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Datum-Gitternetz zu Survey Controller (*.cdg).

4.	Klicken Sie auf OK.

Wenn Sie die Option Datum-Gitternetz zu Survey Controller (*.cdg) wählen, erscheint das Dialogfeld Ein Datum-Gitternetz exportieren.

Bestehende kombinierte Datum-Gitternetz-Datei zum Survey Controller exportieren

Wählen Sie diese Option, um eine kombinierte Datum-Gitternetz-Datei zu Trimble Survey Controller (Version 7.00 oder höher) zu exportieren. Sie können jede der im Ordner GeoData vorhandenen kombinierten Datum-Gitternetz-Dateien exportieren. Wenn Sie diese Option wählen, erscheint das Dialogfeld Wählen.

Eine kombinierte Datum-Gitternetz-Datei für den Export zum Survey Controller erzeugen

Wählen Sie diese Option, um eine neue kombinierte Datum-Gitternetz-Datei mit Hilfe der Datum-Gitternetz-Datei, die vom aktuellen Projekt-Koordinatensystem verwendet wird, zu erzeugen. Das Dialogfeld Kombinierte Datum-Gitternetz-Datei erscheint.


Dialogfeld Speichern unter (Datum-Gitternetz-/Geoid-Gitternetz-Export)

Verwenden Sie dieses Dialogfeld, um einen Namen für die Kombinierte Datum-Gitternetz (*.cdg)-Datei oder die Geoid-Gitternetz (*.ggf)-Datei einzugeben.

Klicken Sie auf OK, um das Dialogfeld Data Transfer Speichern unter zu öffnen.


Dialogfeld Kombinierte Datum-Gitternetz-Datei

Verwenden Sie dieses Dialogfeld, um ein Gebiet zu definieren, für das Sie eine kombinierte Datum-Gitternetz (*.cdg)-Datei erzeugen möchten. Sie können dann die kombinierte Datum-Gitternetz-Datei zur Verwendung im Feld zum Trimble Survey Controller übertragen.

Um eine .cdg-Datei zu erzeugen, muß das im Projekt ein Datum-Gitternetz als Koordinatensystem verwendet werden. Informationen über die Verwendung von Datum-Gitternetz-Dateien finden Sie in der Hilfe des Coordinate System Manager-Programms.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Datum-Gitternetz zu Survey Controller.

4.	Klicken Sie auf OK. Das Dialogfeld Ein Datum-Gitternetz exportieren erscheint.

5.	Wählen Sie die Option Eine kombinierte Datum-Gitternetz-Datei für den Export zum Survey Controller erzeugen.

6.	Klicken Sie auf OK.

Der gelbe Rahmen auf dem Globus definiert das Gebiet, das von den Breitengrad- und Längengrad-Datum-Gitternetz-Dateien abgedeckt wird.

Verwenden Sie die Symbole, um einen Rahmen über ein Gebiet auf dem Globus innerhalb des Datum-Gitternetzes zu ziehen, das vom kombinierten Datum-Gitternetz abgedeckt werden soll.

Dateieigenschaften

Die Gruppe Dateieigenschaften zeigt die Dateien an, die verwendet werden, um die .cdg-Datei zu erzeugen.

Datum-Gitternetz

Zeigt die Datum-Gitternetz-Datei an, die verwendet wird, um die .cdg-Datei zu erzeugen.

Breitengrad-Gitternetz-Datei

Zeigt die Breitengrad-Gitternetz-Datei an, die verwendet wird, um die .cdg-Datei zu erzeugen.

Längengrad-Gitternetz-Datei

Zeigt die Längengrad-Gitternetz-Datei an, die verwendet wird, um die .cdg-Datei zu erzeugen.

Gitter-Eigenschaften

Die Gruppe Gitter-Eigenschaften zeigt die Eigenschaften des Gitternetzes an, das Sie definieren.

Breitengradgrenzen

Zeigt die Breitengradgrenzen des aktuellen Rahmens an.

Längengradgrenzen

Zeigt die Längengradgrenzen des aktuellen Rahmens an.

Dateigröße

Zeigt die Größe der erzeugten .cdg-Datei an. Der Wert der Dateigröße ändert sich, wenn Sie die Form des Rahmens auf dem Globus ändern.

Survey Controller-Name

Zeigt den internen Namen der .cdg-Datei an, die in Trimble Survey Controller verwendet wird. Das Feld Survey Controller-Name erhält gemäß Voreinstellung den Namen des ursprünglichen Datum-Gitternetzes. Wenn die .cdg-Datei in einem Trimble Survey Controller-Projekt verwendet wird, wir der interne Name referenziert. Beim Importieren der Datenrekorder (*.dc)-Datei verwendet Trimble Geomatics Office den internen Namen, um zu bestimmen, ob das in der .dc-Datei verwendete Datum-Gitternetz mit dem Datum-Gitternetz für das Trimble Geomatics Office-Projekt übereinstimmt.

HINWEIS: Wenn Sie dieses Feld bearbeiten, stellen Sie sicher, daß Sie zum Namen nur ein Suffix oder ein Präfix hinzufügen. Dadurch ist der Name eindeutig, und das ursprüngliche Datum-Gitternetz kann beim Importieren trotzdem erkannt werden. Sie können nicht fortfahren, bevor das Feld Survey Controller-Name den Namen des Datum-Gitternetzes enthält.

Globus-Eigenschaften

Die Gruppe Globus-Eigenschaften zeigt die Cursor-Position an und bietet Optionen, um die Anzeige des Globus zu konfigurieren.

Cursor-Position

Zeigt die aktuellen Breitengrad- und Längengrad-Positionen des Mauszeigers auf dem Globus an.

Landesgrenzen anzeigen

Wählen Sie dieses Kontrollkästchen, um Landesgrenzen auf dem Globus anzuzeigen.

Staatsgrenzen anzeigen

Wählen Sie dieses Kontrollkästchen, um Staatsgrenzen auf dem Globus anzuzeigen.

Flüsse anzeigen

Wählen Sie dieses Kontrollkästchen, um Flüsse auf dem Globus anzuzeigen.


Option Geoid-Datei zu Survey Controller (*.ggf)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Geoid-Gitternetz (*.ggf)-Dateien speichern den Unterschied zwischen dem WGS-84-Ellipsoid und dem Geoid für das definierte Gebiet. Informationen über Geoidmodelle finden Sie unter dem Thema Geoidmodelle – Überblick.

Wenn eine .ggf-Datei als Teil des Koordinatensystems für ein Trimble Geomatics Office-Projekt verwendet wird, werden ungefähre orthometrische Höhen für GPS-Punkte berechnet. Um eine .ggf-Datei im Feld zu verwenden, verwenden Sie Trimble Geomatics Office, um die .ggf-Datei zu Trimble Survey Controller (Version 6.00 oder höher) zu übertragen.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Geoid-Datei zu Survey Controller.

Das Dialogfeld Ein Geoidmodell exportieren erscheint.

Sie können diese Option verwenden zum:

  Übertragen aller .ggf-Dateien im Ordner Programme\Gemeinsame Dateien\Trimble\GeoData.

  Untergittern der .ggf-Datei, die im aktuellen Trimble Geomatics Office-Projekt verwendet wird, um eine kleinere Geoid-Gitternetz-Datei zu extrahieren. Dieser Vorgang verringert die Größe der .ggf-Datei, die Sie zum TSC1-Datenrekorder senden, auf dem Trimble Survey Controller (Version 6.00 oder höher) läuft.

Informationen über die Unterstützung von Geoidmodellen für verschiedene Trimble Survey Controller-Versionen finden Sie unter dem Thema Geoidmodelle und Trimble Survey Controller.

Wenn Sie durch Untergittern eine neue .ggf-Datei erzeugen, wird der Name des ursprünglichen Geoidmodells gespeichert (z. B. GEOID96 Conus). Dieser interne Name ist auch in der .dc-Datei enthalten, die die untergitterte .ggf-Datei verwendet. Beim Importieren einer .dc-Datei verwendet Trimble Geomatics Office diesen Namen, um zu bestimmen, ob das im Feld verwendete Geoidmodell mit dem für das Trimble Geomatics Office-Projekt definierte Geoidmodell übereinstimmt.

HINWEIS: Sie können zudem das Grid Factory-Programm verwenden, um Geoidmodelle zu untergittern. Das Grid Factory-Programm ist Teil der benutzerdefinierten Installationsoption in Trimble Geomatics Office.


Option Geoid-Datei zu TDS Survey Pro CE (*.ggf)

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

In Geoid-Gitternetz-Dateien (*.ggf) wird der Abstand zwischen dem WGS-84 Ellipsoid und dem Geoid für den definierten Bereich gespeichert. Weitere Informationen über Geoidmodelle finden Sie unter dem Thema Geoidmodelle − Überblick.

Wenn eine .ggf-Datei als Teil eines Koordinatensystems für ein Trimble Geomatics Office-Projekt verwendet wird, werden ungefähre Höhen für GPS-Punkte berechnet. Wenn Sie eine .ggf-Datei im Feld verwenden möchten, verwenden Sie Trimble Geomatics Office, um die .ggf-Datei zu TDS Survey Pro CE (Version 3.5 oder höher) zu übertragen.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Geoid-Datei zu TDS Survey Pro CE.

Das Dialogfeld Ein Geoidmodell exportieren erscheint.

Mit dieser Option können Sie:

  eine beliebige .ggf-Datei in den Ordner Programme\Gemeinsame Dateien\Trimble\GeoData exportieren.

  die im aktuellen Trimble Geomatics Office-Projekt verwendete .ggf-Datei untergittern. Dadurch wird die Größe der .ggf-Datei reduziert, die Sie zu einem TSCe-Gerät, auf dem TDS Survey Pro CE (Version 3.5 oder höher) ausgeführt wird, übertragen.

HINWEIS: Sie können auch das Grid Factory-Programm zum Untergittern von Geoid-Gitternetz-Dateien verwenden. Das Grid Factory-Programm ist Teil der benutzerdefinierten Installationsoption in Trimble Geomatics Office.


Geoidmodelle und Trimble Survey Controller

Geoidmodelle können zur Trimble Survey Controller-Version 6.00 (oder höher) übertragen werden. Trimble Survey Controller verwendet diese Geoidmodelle, wenn die Punktanzeige zwischen WGS-84-Positionen und Gitternetz-(HoReHö)-Positionen umgeschaltet wird.

Geoidmodelle sind im allgemeinen sehr große Dateien. Es ist normalerweise nicht möglich, ein komplettes Geoidmodell in die Trimble Survey Controller-Version 6.00 (oder höher) zu laden.

Verwenden Sie die Option Datei / Exportieren / Geoid-Datei zu Survey Controller, um ein kleineres Geoidmodell für das Gebiet zu erzeugen. Sie können dann die kleinere Datei zum Trimble Survey Controller übertragen.

Frühere Trimble Survey Controller Versionen

Die folgenden Punkte beziehen sich auf frühere Trimble Survey Controller-Versionen.

Version 5.00

Hierbei handelt es sich um eine militärische Version, die der Allgemeinheit nicht zur Verfügung steht.

Version 4.00

Diese Version kann nicht mit Geoidmodellen arbeiten. Wenn Trimble Geomatics Office eine vollständige Definition eines Koordinatensystems mit Punktpositionen entweder als Gitternetz- oder WGS-84-Positionen  in eine .dc-Datei der Trimble Survey Controller-Version 4.00 schreiben würde, könnten falsche ellipsodische und orthometrische Höhen in Trimble Survey Controller angezeigt werden.

Dies könnte z. B. in Trimble Survey Controller passieren, wenn die Datenansicht umgeschaltet wird. Dann würden nach der Übertragung von Gitternetz-Positionen falsche WGS-84-Höhen angezeigt. Falsche Gitter-Punkthöhen würden angezeigt, wenn WGS-84-Positionen übertragen worden wären.

Um dies zu verhindern, gibt Trimble Geomatics Office den Datum-Datensatz der Projektdefinition aus, warnt Sie dann, daß es wegen des Geoidmodells nicht möglich ist, zwischen HoReHö-Werten und WGS-84-Werten zu konvertieren, und weist Sie darauf hin, daß eine leere Transformation hinzugefügt wurde. Darauf folgt ein anderer Datum-Datensatz, bei dem die Methode auf Keine eingestellt ist. Ein aktueller Datum-Datensatz überschreibt jeden früheren. Dies bedeutet, daß es in der Trimble Survey Controller-Version 4.00 nicht möglich ist, die Punktansicht zwischen WGS-84- und Gitternetz-Positionen umzuschalten. Dadurch wird sichergestellt, daß keine fehlerhaften Werte angezeigt werden.

Für die Arbeit im Feld bedeutet dies, daß Sie eine Kalibrierung durchführen müssen, wenn Sie Gitternetz-Positionen laden. Sie müssen dies tun, bevor Sie irgendwelche Arbeiten im Feld unter Verwendung dieser Punkte durchführen. (Dies ist nicht relevant, wenn die Gitter-Positionen zu Kalibrierungszwecken übertragen wurden).

HINWEIS: Wenn WGS-84-Positionen übertragen werden, können Sie sofort mit dem Abstecken beginnen. Es ist jedoch nicht möglich, die Gitter-Koordinaten anzuzeigen, bevor eine Kalibrierung im Feld durchgeführt wurde.

Versionen vor Version 4.00

Frühere Trimble Survey Controller-Versionen können nur WGS-84-Positionen laden und werden deshalb nicht von der Verwendung eines Geoidmodells in einem Projekt beeinflußt.


Dialogfeld Ein Geoidmodell exportieren

Wenn Sie die Option Geoid-Datei zu Survey Controller (*.ggf) oder die Option Geoid-Datei zu TDS Survey Pro CE (*.ggf), wählen erscheint das Dialogfeld Ein Geoidmodell exportieren.

Bestehendes Geoidmodell exportieren

Wählen Sie diese Option, um eine Geoid-Gitternetz-Datei zu Trimble Survey Controller (Version 6.00 oder höher) zu exportieren. Sie können jede Geoid-Gitternetz-Datei im Ordner GeoData exportieren. Wenn Sie diese Option wählen, erscheint das Dialogfeld Wählen.

Ein Untergitter eines Geoidmodells für den Export erzeugen

Wählen Sie diese Option, um die im aktuellen Koordinatensystem verwendete Geoid-Gitternetz-Datei zu untergittern. Das Dialogfeld Geoid-Gitternetz-Datei erzeugen erscheint.


Dialogfeld Geoid-Gitternetz-Datei erzeugen

Verwenden Sie dieses Dialogfeld, um das Gebiet zu definieren, für das Sie eine neue Geoid-Gitternetz-Datei erzeugen möchten, die auf der Geoid-Gitternetz-Datei basiert, die im Projekt-Koordinatensystem verwendet wird.

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Geoid-Datei zu Survey Controller (*.ggf) oder die Option Geoid-Datei zu TDS Survey Pro CE (*.ggf).

4.	Klicken Sie auf OK. Das Dialogfeld Ein Geoidmodell exportieren erscheint.

5.	Wählen Sie die Option Ein Geoidmodell für den Export erzeugen.

6.	Klicken Sie auf OK.

Der gelbe Rahmen auf dem Globus definiert das Gebiet das vom Geoidmodell abgedeckt wird.

Verwenden Sie die Symbole, um einen Rahmen über ein Gebiet auf dem Globus innerhalb des Geoidmodells zu ziehen, das vom Geoidmodell abgedeckt werden soll.

Dateieigenschaften

Die Gruppe Dateieigenschaften zeigt die Eigenschaften der Geoid-Gitternetz-Datei, die verwendet wird, um die .ggf-Datei zu erzeugen.

Geoid

Zeigt das Geoidmodell an, das im Projekt-Koordinatensystem verwendet wird.

Geoid-Gitternetz-Datei

Zeigt den Namen der Geoid-Gitternetz-Datei an, die im Geoidmodell verwendet wird.

Gitter-Eigenschaften

Die Gruppe Gitter-Eigenschaften zeigt die Eigenschaften des Gitternetzes an, das Sie definieren.

Breitengradgrenzen

Zeigt die Breitengradgrenzen des aktuellen Rahmens an.

Längengradgrenzen

Zeigt die Längengradgrenzen des aktuellen Rahmens an.

Dateigröße

Zeigt die Größe der zu erzeugenden Geoid-Gitternetz-Datei an. Der Wert der Dateigröße ändert sich, wenn Sie die Form des Rahmens auf dem Globus ändern.

Name

Zeigt den internen Namen der Untergitter-Datei an, die in Trimble Survey Controller oder in der TDS Survey Pro CE-Software verwendet wird. Das Namensfeld enthält gemäß Voreinstellung den Namen des ursprünglichen Geoidmodells. Wenn die .ggf-Datei in einem Trimble Survey Controller-Projekt verwendet wird, wir der interne Name referenziert. Beim Importieren der Datenrekorder (*.dc)-Datei verwendet Trimble Geomatics Office den internen Namen, um zu bestimmen, ob das in der .dc-Datei verwendete Geoidmodell mit dem Geoidmodell für das Trimble Geomatics Office-Projekt übereinstimmt.

HINWEIS: Wenn Sie dieses Feld bearbeiten, stellen Sie sicher, daß Sie zum Namen nur ein Suffix oder ein Präfix hinzufügen. Dadurch ist der Name eindeutig, und das ursprüngliche Geoidmodell kann beim Importieren trotzdem erkannt werden. Sie können nicht fortfahren, bevor das Feld den Namen des Geoidmodells enthält.

Globus-Eigenschaften

Die Gruppe Globus-Eigenschaften zeigt die Cursor-Position an und bietet Optionen, um die Anzeige des Globus zu konfigurieren.

Cursor-Position

Zeigt die aktuellen Breitengrad- und Längengrad-Positionen des Mauszeigers innerhalb des Globus an.

Landesgrenzen anzeigen

Wählen Sie dieses Kontrollkästchen, um Landesgrenzen auf dem Globus anzuzeigen.

Staatsgrenzen anzeigen

Wählen Sie dieses Kontrollkästchen, um Staatsgrenzen auf dem Globus anzuzeigen.

Flüsse anzeigen

Wählen Sie dieses Kontrollkästchen, um Flüsse auf dem Globus anzuzeigen.

HINWEIS: Sie können auch das Grid Factory-Programm zum Untergittern von Geoidmodell-Dateien verwenden. Das Grid Factory-Programm ist Teil der benutzerdefinierten Installationsoption in Trimble Geomatics Office.


Option Merkmals- und Attributbibliothek direkt zu Survey Controller (*.fcl)

 Überblick und weitere Informationen

So exportieren Sie eine Merkmals- und Attributbibliothek zu Trimble Survey Controller:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Merkmals- und Attributbibliothek direkt zu Survey Controller (*.fcl).

Das Dialogfeld Merkmals- und Attributbibliothek wählen erscheint

Verwenden Sie diese Option, um eine Merkmals- und Attributbibliothek zu Trimble Survey Controller zu exportieren, damit Sie Kartiercodes im Feld aufzeichnen können. Sie können auch die Merkmals- und Attributbibliothek verwenden, um Attribute für Kartiercodes mit definierten Attributen aufzuzeichnen.


Dialogfeld Merkmals- und Attributbibliothek wählen

Wählen Sie dieses Dialogfeld, um die Merkmals- und Attributbibliothek auszuwählen, die Sie zum Vermessungsgerät übertragen möchten.

Durchsuchen

Klicken Sie auf Durchsuchen, um eine Bibliothek auszuwählen.

Datei

Die Voreinstellung für das Feld Datei ist der Name der zuletzt exportierten Datei.

Attribute exportieren

Dies ist nur möglich, wenn Sie zur Trimble Survey Controller-Version 7.00 oder höher exportieren. Wählen Sie dieses Kontrollkästchen, um die in der Merkmals- und Attributbibliothek enthaltenen Attributdefinitionen zu exportieren.

Verwenden Sie diese Option, wenn Sie Attributinformationen im Feld aufzeichnen möchten. Wenn Sie dieses Kontrollkästchen deaktivieren, werden die in der Bibliotheksdatei definierten Attribute nicht exportiert.

 Dieses Feld ist nicht verfügbar, wenn Sie zum TDS Survey Pro CE oder zur Trimble 3600/5600-Software exportieren.

OK

Klicken Sie auf OK, nachdem Sie die geeignete Merkmals- und Attributbibliothek ausgewählt haben.

Das Dialogfeld Data Transfer Speichern unter erscheint.

HINWEIS: Steuercodes werden ebenfalls zu Trimble Survey Controller exportiert.


Dialogfeld Optionen Merkmals- und Attributbibliothek

Verwenden Sie dieses Dialogfeld, um die Trimble Survey Controller-Version zu konfigurieren, zu der Sie exportieren

So führen Sie dies durch:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Merkmals- und Attributbibliothek direkt zu Survey Controller.

4.	Klicken Sie auf Optionen.

Version

Wenn Sie eine Trimble Survey Controller-Version vor Version 7.00 wählen, ist das Kontrollkästchen Attribute exportieren im Dialogfeld Merkmals- und Attributbibliothek wählen nicht verfügbar. Dies geschieht, da diese Versionen keine Attribute unterstützen.


Option Attribut-Verzeichnis (*.ddf) zu Survey Controller

 Überblick und weitere Informationen

Verwenden Sie diese Option, um eine Attribut-Verzeichnis-Datei zur Trimble Survey Controller-Version 7.00 oder höher zu exportieren. Verwenden Sie die Attribut-Verzeichnis-Datei in Trimble Survey Controller, um Attribute aufzuzeichnen.

So exportieren Sie eine Attribut-Verzeichnis-Datei zu Trimble Survey Controller:

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Attribut-Verzeichnis zu Survey Controller (*.ddf).

4.	Klicken Sie auf OK. Das Dialogfeld Wählen erscheint.


Dialogfeld Wählen (Attribut-Verzeichnis-Dateien zu Trimble Survey Controller exportieren)

Verwenden Sie dieses Dialogfeld, um die Attribut-Verzeichnis-Datei (*.ddf) zu wählen, die Sie zu Trimble Survey Controller übertragen möchten.

Wenn Sie auf Öffnen klicken, erscheint das Dialogfeld Data Transfer Speichern unter.


Daten von Trimble Survey Controller übertragen - Überblick
Daten von Trimble Survey Controller übertragen − Überblick

 Wie kann ich ...

Überblick

Sie können ein Gerät anschließen, auf dem Trimble Survey Controller ausgeführt wird, und Projekte in Trimble Geomatics Office übertragen. Beim Importieren werden die Projekte in Datenrekorder (*.dc)-Dateien konvertiert. Hierzu muß eine Survey Controller-Geräteeinstellung im Data Transfer- Programm existieren.

HINWEIS: Wenn Projekten Trimble GPS-Rohdatendateien (*.dat) zugewiesen wurden, werden die .dat-Dateien mit den Projekten importiert. Wenn Sie eine .dat-Datei mehr als einmal in das gleiche Projekt importieren, werden bestehende Besetzungen im Projekt nicht standardmäßig im Dialogfeld DAT-Checkin ausgewählt.

Beim Importieren einer .dc-Datei verwendet Trimble Geomatics Office die jedem Punkt in Trimble Survey Controller zugewiesene Klasse und die zur Bestimmung der Punktposition verwendete Methode, um dem Punkt eine Punktqualität zuzuweisen. Bei der Neuberechnung wird diese Qualität zur Bestimmung der Punktposition verwendet.

HINWEIS: Wenn Sie Daten zu oder von der Trimble Survey Controller- Version 7.60 übertragen, verwenden Sie das .dc-Dateiformat für die Version 7.50.

HINWEIS: Wenn Sie eine Netzausgleichung mit Daten durchführen möchten, die Sie von Trimble Survey Controller heruntergeladen haben, stellen Sie sicher, daß Sie bei der Vermessung Druck, Temperatur, Krümmungs- und Refraktionskorrekturen im Survey Controller-Vermessungsstil eingeben.


Notiz-Datensätze - Überblick
Notiz-Datensätze − Überblick

Notizen in einem Projekt sind benutzerdefinierte Notizen aus einem Trimble Survey Controller. Es werden keine Notizen mit Vermessungsinformationen wie ‘Initialisierung gelungen’ und ‘Initialisierung verloren’, im Projekt abgelegt.

Notiz-Datenrekorder-Dateien werden in älteren Trimble Survey Controller-Versionen für folgende Zwecke verwendet:

Wenn Sie ältere Trimble Survey Controller-Versionen verwenden, und Notiz-Datensätze verwenden möchten, wählen Sie das Dialogfeld Wählen / Nach Typ, um alle Notiz-Datensätze im Projekt auszuwählen.


Sokkia Datenrekorder-Dateien (*.sdr)

Trimble Geomatics Office unterstützt Daten im Sokkia Datenrekorder-Datei-(*.sdr)-Format.

Mit Trimble Geomatics Office können Sie:

  eine Sokkia Datenrekorder-Datei (*.sdr) in ein Trimble Geomatics Office-Projekt importieren.

  ein Trimble Geomatics Office-Projekt in eine Sokkia Datenrekorder-Datei (*.sdr) exportieren.

So importieren Sie eine Sokkia Datenrekorder-Datei (*.sdr):

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option Sokkia Datenrekorder-Dateien (*.sdr). Das Dialogfeld Öffnen erscheint.

4.	Wählen Sie die Datei, die Sie importieren möchten, aus dem Ordner, und klicken Sie auf Öffnen.

So exportieren Sie das aktuelle Trimble Geomatics Office-Projekt in eine Sokkia Datenrekorder-Datei (*.sdr):

1.	Wählen Sie Datei / Exportieren. Das Dialogfeld Exportieren erscheint.

2.	Wählen Sie das Register Vermessung.

3.	Wählen Sie die Option SDR- Dateien (*.sdr).

4.	Klicken Sie auf Optionen, um das Dialogfeld Datenrekorder-Einstellungen zu öffnen, und den internen Namen der Datei und die Dateiversion des Sokkia-Datenrekorders festzulegen.

5.	Klicken Sie auf OK, um die Einstellungen zu akzeptieren und zum Dialogfeld Exportieren zurückzukehren.

6.	Klicken Sie auf OK.

Das Dialogfeld Data Transfer Speichern unter erscheint.

7.	Wählen Sie den Ordner, zu dem Sie die Datei exportieren möchten, geben Sie einen Dateinamen ein, und klicken Sie auf Speichern.


UK National Grid-Dateien zu Trimble Survey Controller übertragen

 Wie kann ich ...

Verwenden Sie das Data Transfer-Programm, um UK National Grid-Dateien (*.pgf) direkt zu einer Trimble Survey Controller-Version 7.5 oder höher zu übertragen.

Sie können eine beliebige .pgf-Datei übertragen, die sich im Ordner Programme\Gemeinsame Dateien\Trimble\Geodata befindet.

HINWEIS: Diese Exportoption ist nur verfügbar, wenn das Data Transfer-Programm als selbständiges (Standalone) Programm läuft. Diese Option ist nicht im Dialogfeld Exportieren in Trimble Geomatics Office verfügbar.


Graphische Auswahl - Überblick

Weitere Informationen

 Wie kann ich ...

Überblick

Verwenden Sie die graphische Auswahl, um Werte in Felder einzugeben. Beispiel: Sie können ein Layer-Feld ausfüllen, indem Sie einen Punkt anklicken, der sich im gewünschten Layer befindet.

In Feldern, die die graphische Auswahl unterstützen, sieht der Zeiger im Graphikfenster wie folgt aus:

HINWEIS: Wenn das von Ihnen im Graphikfenster ausgewählte Element den für das hervorgehobene Feld erforderlichen Wert nicht liefern kann, bleibt das Feld im Dialogfeld unverändert.

Einige Felder werden als Gruppen von Werten ausgefüllt. Durch einfaches Klicken werden alle gruppierten Felder ausgefüllt. Beispiel: Die Felder Hochwert, Rechtswert und Höhe bilden üblicherweise eine Gruppe. Wenn Sie nur ein Feld ausfüllen möchten, wählen Sie es, halten Sie die Taste Alt gedrückt, und klicken Sie dann.

Nachdem die graphische Auswahl verwendet wurde, aktiviert Trimble Geomatics Office das nächste leere Feld.

Spezielle Anwendungen für die graphische Auswahl

Die graphische Auswahl hat folgende spezielle Anwendungen:

  Um beim Ausfüllen eines Azimut-Feldes den gegenüberliegenden Azimutwert einzugeben, halten Sie die Umschalt-Taste gedrückt, und klicken Sie dann. Sie können die graphische Auswahl für das Azimut-Feld nicht verwenden, wenn Sie Punkte nach Azimut und Strecke hinzufügen.

  Wenn Sie die Taste Strg gedrückt halten, während Sie die graphische Auswahl verwenden, wird das Einrasten auf Elemente verhindert - es werden nur Koordinaten ausgewählt. So können Sie Koordinaten wählen, die nahe bei einem Element liegen.

  Verwenden Sie die Ansicht-Menübefehle (z. B. Zoom und Verschieben), um die Elemente, deren Werte Sie für die graphische Auswahl benötigen, zu finden. Wenn Sie die Werte gefunden haben, müssen Sie das auszufüllende Feld erneut aktivieren, bevor Sie die Werte kopieren können.


Winkel eingeben

Stellen rechts vom Dezimalzeichen werden gemäß Winkel-, Einheiten- und Formateinstellungen interpretiert.

Verwenden Sie das Register Einheiten und Format im Dialogfeld Projekteigenschaften, um ein Format einzustellen.

Beispiel:

Eingabe der Stellen 10,1234


Einheiten konvertieren

Verwenden Sie das Register Einheiten und Format im Dialogfeld Projekteigenschaften, um die Anzeigeeinheiten für Felder mit Einheiten einzustellen. Wählen Sie hierzu Datei / Projekteigenschaften.

Jeder in ein Feld eingegebene numerische Wert wird als Werteinheit interpretiert, die für das System eingestellt wurde. Beispiel: Ist die Einheit für Höhe auf Meter eingestellt, werden alle numerischen Werte, die in ein Höhen-Feld eingegeben werden, als Meter-Werte interpretiert.

Sie können diese Einstellung übergehen, indem Sie den numerischen Wert und anschließend eine alphabetische Eingabe eingeben.

Sie können andere Werte in das System eingeben, indem Sie eine Werteinheit angeben. Beispiel: Wenn Sie eine Höhe als ‘25 Ft’ eingeben, erkennt Trimble Geomatics Office die Einheit und interpretiert den Wert entsprechend.

Die folgende Tabelle zeigt die entsprechenden Werte für diese Funktion an:


Elemente ziehen

Wenn Sie ein ausgewähltes Element mit der Maus verschieben oder drehen möchten, verwenden Sie die Punkte zum Anfassen des Elements (Handgriffe).

Beispiel: Sie können die Position einer Anmerkung verändern, um die enthaltenen Informationen besser darzustellen und das Layout des Hauptgraphikfensters zu verbessern.

Text/Anmerkungen

Bewegen Sie den Mauszeiger über den Textrahmen, um Text- oder Anmerkungselemente zu ziehen, und finden Sie einen der beiden Handgriff-Punkte. Der Mauszeiger wird zu einem entsprechenden Symbol, wenn Sie ihn auf den Handgriff setzen. Mit dem Ziehen-Zeiger können Sie das Element verschieben. Mit dem Drehen-Zeiger kann das Element gedreht werden.

Beispiel:

Wählen Sie den gewünschten Handgriff-Punkt, und ziehen Sie mit der Maus. Die Position, auf der Sie die Maustaste loslassen, bleibt erhalten.

HINWEIS: Solange sich der Verankerungstyp nicht in einer Position auf der rechten Seite befindet, befindet sich der Handgriff zum Drehen in der oberen rechten Position. Gleichermaßen, wenn ein Verankerungstyp links gewählt ist, befindet sich der Handgriff zum Drehen in der oberen linken Position.

Handgriffe zur Bearbeitung können sich an folgenden Positionen befinden:

HINWEIS: Die Basislinie zeigt die unterste Position für Zeichen an, die keine Unterlängen enthalten (d. h. der Freiraum von unten bis zur Basislinie ist für die Unterlängen von Kleinbuchstaben vorbehalten).

Kurven

Wählen Sie die Kurve(n), um die Eingangs- oder Ausgangstangente von Kurven zu ändern. Bewegen Sie den Mauszeiger über die Kurve(n), und lokalisieren Sie die Handgriffe zum Drehen. Es gibt zwei Handgriffe für jede Kurve (einen für die Eingangstangente und einen für die Ausgangstangente).

Der Zeiger ändert sich zu [image], wenn Sie ihn auf den Handgriff setzen.

Mit dem Drehen-Zeiger können Sie die gewählte(n) Kurve(n) drehen.

HINWEIS: Bei zwei angrenzenden Kurven können Sie beide Kurven mit einem Handgriff drehen. Trimble Geomatics Office erstellt automatisch eine gemeinsame Tangente zwischen angrenzenden Kurven.

Halten Sie die Taste Strg gedrückt, um auf bestehende Elemente einzurasten. Das Einrasten auf bestehende Elemente ist gemäß Voreinstellung ausgeschaltet..

Punkte

Das Verschieben von Punkten stellt eine einfache Verschiebung von Datenbank-Punkten dar. Um einen oder mehrere ausgewählte(n) Punkt(e) zu verschieben, wählen Sie ihn/sie, bewegen Sie den Zeiger über den/die Punkt(e), und finden Sie den Handgriff. Der Zeiger ändert sich zu [image], wenn Sie ihn auf den Handgriff setzen. Wenn sich der/die Punkt(e) am gewünschten Ort befinden, lassen Sie die Maustaste los. Das Dialogfeld Punkte und Text verschieben erscheint. Verwenden Sie dieses Dialogfeld, um die Werte zu bearbeiten und zu bestätigen.

Das Ziehen von Punkten bewirkt, daß alle gewählten Punkte mitsamt Text verschoben werden.


Punkte ohne Namen

Innerhalb eines Projekts wird jedes Element mit einer eindeutigen Benennung aufgezeichnet. Diese Benennung ist ein eindeutiger ganzzahliger Wert, den Trimble Geomatics Office verwendet, um den Punkt zu identifizieren. Dies bedeutet, daß Trimble Geomatics Office den Punkt an seiner internen Benennung erkennt, selbst wenn einem Punkt kein Name zugewiesen wurde.

Wenn ein Punkt ohne zugewiesenen Namen einen Namen benötigt (z. B. wenn er als Endpunkt im Dialogfeld Punkte hinzufügen ausgewählt wurde), erscheint die Benennung für diesen Punkt innerhalb der Datenbank. Ein Gleichheitszeichen (=) ist dem Namen vorangestellt. So kann die Software feststellen, welchen Punkt Sie ausgewählt haben.


Statusleiste

Die Statusleiste befindet sich am unteren Rand des Graphikfensters. Sie zeigt Informationen über den aktuellen Status der Software, einschließlich Koordinateninformationen, an.

Wenn Sie die Maus über dem Timeline-Ansichtsbereich positionieren, werden Zeitinformationen in der Statusleiste angezeigt. Diese Informationen können in Windows-Ortszeit oder in GPS-Wochen/Sekunden angezeigt werden, abhängig von den Einstellungen für die Zeitanzeige.

Wenn Trimble Geomatics Office bestimmte Aufgaben durchführt, z. B. beim Verarbeiten von Basislinien, wird die Anzeige in der Statusleiste zur Statusanzeige.

Weitere Informationen zu den Anzeigen in der Statusleiste finden Sie im Trimble Geomatics Office-Benutzerhandbuch.


Statusleiste - Fensterecke

Mit der Fensterecke können Sie die Größe des Hauptgraphikfensters ändern.


Statusanzeige

Die Anzeige in der Statusleiste wird zu einer Statusanzeige, wenn Trimble Geomatics Office bestimmte Aufgaben durchführt.

Eine kurze Beschreibung der Aufgabe und eine Statusanzeige erscheint, die angibt, zu welchem Prozentsatz die Aufgabe erledigt ist.

Bei Aufgaben, die unterbrochen werden können, erscheint die Meldung Drücken Sie ESC, um abzubrechen. Wenn diese Meldung erscheint, drücken Sie die Esc-Taste, um die Aufgabe zu beenden. Bei Aufgaben, die nicht abgebrochen werden können, wird diese Meldung nicht angezeigt.


Befehl Wiederherstellen

Verwenden Sie diesen Befehl, um die ursprüngliche Größe und Position des aktiven Fensters wiederherzustellen.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Wiederherstellen aus dem Systemmenü.


Befehl Verschieben

Verwenden Sie diesen Befehl, um einen Vierfachpfeil anzuzeigen, damit Sie das aktive Fenster oder Dialogfeld mit den Pfeiltasten verschieben können.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Verschieben aus dem Systemmenü.

HINWEIS: Dieser Befehl ist nicht verfügbar, wenn Sie das Fenster maximieren.


Befehl Größe ändern

Verwenden Sie diesen Befehl, um einen Vierfachpfeil anzuzeigen, damit Sie die Größe des aktiven Fensters mit den Pfeiltasten ändern können.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Größe ändern aus dem Systemmenü.

Nachdem der Mauszeiger zu einem Vierfachpfeil wird:

1.	Drücken Sie eine der Pfeiltasten (links, rechts, auf oder ab), um den Zeiger zur gewünschten Fenstergrenze zu bewegen.

2.	Drücken Sie eine Pfeiltaste, um die Grenze zu verschieben.

3.	Drücken Sie die Eingabe-Taste, wenn das Fenster die von Ihnen gewünschte Größe hat.

HINWEIS: Dieser Befehl ist nicht verfügbar, wenn Sie das Fenster maximieren.


Befehl Minimieren

Verwenden Sie diesen Befehl, um das Trimble Geomatics Office-Fenster auf ein Symbol zu reduzieren.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Minimieren aus dem Systemmenü.


Befehl Maximieren

Verwenden Sie diesen Befehl, um das aktive Fenster so zu vergrößern, daß es den verfügbaren Raum ausfüllt.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Maximieren aus dem Systemmenü.


Befehl Schließem
Befehl Schließen

Verwenden Sie diesen Befehl, um das aktive Fenster oder Dialogfeld zu schließen.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Schließen aus dem Systemmenü.


Befehl Nächstes

Verwenden Sie diesen Befehl, um zum nächsten offenen Graphikfenster zu wechseln, in der Reihenfolge, in der Sie sie geöffnet haben.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Nächstes aus dem Systemmenü.


Befehl Vorheriges

Verwenden Sie diesen Befehl, um zum vorherigen offenen Graphikfenster zu wechseln, in der Reihenfolge, in der Sie sie geöffnet haben.

So greifen Sie darauf zu:

1.	Wenden Sie eine der folgenden Methoden an:

  Klicken Sie auf die Trimble Geomatics Office-Schaltfläche [image] auf der Titelleiste.

  Klicken Sie mit der rechten Maustaste auf die Titelleiste.

  Klicken Sie auf das Systemmenüfeld [image] auf der Menüleiste.

Das Systemmenü erscheint.

2.	Wählen Sie Vorheriges aus dem Systemmenü.


Befehl Wechseln zu

Verwenden Sie diesen Befehl, um eine Liste aller offenen Anwendungen anzuzeigen.

Verwenden Sie die Option Task-Liste, um zu einer Anwendung in der Liste zu wechseln oder sie zu schließen.

Dialogfeldoptionen

Wenn Sie den Befehl Wechseln zu wählen, öffnen Sie ein Dialogfeld mit den folgenden Optionen:

Option	Beschreibung
Task-Liste	Wählt die Anwendung zu der Sie wechseln oder die Sie schließen möchten.
Wechseln zu	Aktiviert die gewählte Anwendung.
Task beenden	Schließt die gewählte Anwendung.
Abbrechen	Schließt die Option Task-Liste.
Überlappend	Ordnet alle offenen Anwendungen überlappend an, so daß Sie die Titelleiste sehen können. Diese Option hat keine Auswirkung auf Anwendungen, die auf Symbolgröße minimiert wurden.
Nebeneinander	Ordnet alle offenen Anwendungen in Fenstern an, die nicht überlappen. Diese Option hat keine Auswirkung auf Anwendungen, die auf Symbolgröße minimiert wurden.
Symbole anordnen	Ordnet die Symbole aller minimierten Anwendungen entlang des unteren Bildschirmrands an.


'Drag and Drop' von Dateien in Trimble Geomatics Office

Überblick und weitere Informationen	Wie kann ich ...

Verwenden Sie den Windows Explorer und die ‘Drag and Drop’-Funktion (Ziehen und Ablegen) in Microsoft Windows, um Dateien aus einem Ordner auf Ihrem Computer in ein Trimble Geomatics Office-Projekt zu importieren.

Sie können alle Dateitypen importieren, die in den Registern des Dialogfelds Importieren verfügbar sind.

HINWEIS: Sie können keine .job- oder .raw-Dateien von einer PC-Karte per ‘Drag and Drop’ in ein Trimble Geomatics Office-Projekt übertragen. Um diese Dateien in ein Trimble Geomatics Office-Projekt zu übertragen, verwenden Sie Trimble Geomatics Office. Diese Software konvertiert die Dateien in das richtige Format.

Einzelne Formate

Sie können beide Maustasten verwenden, um Dateien per ‘Drag and Drop’ zu übertragen.

Es ist immer sicherer, die rechte Maustaste zu verwenden, da, wenn Sie:

  die rechte Maustaste loslassen, eine Liste der verfügbaren Importformate erscheint. Sie können das richtige Format aus der Liste wählen.

  die linke Maustaste nach dem Ziehen loslassen, Trimble Geomatics Office die Dateierweiterung verwendet und das Dateiformat bestimmt, das Sie importieren. Es gibt keine Garantie, daß die Software das richtige Dateiformat wählt.

Mehrfache Formate

Sie können beide Maustasten verwenden, um mehrere Dateien per ‘Drag and Drop’ zu übertragen.

  Mit der rechten Maustaste können Sie mehrere Dateien desselben Typs per ‘Drag and Drop’ übertragen. Eine Liste der verfügbaren Formate erscheint, aus denen Sie das richtige Format für den Import wählen können. Wenn Sie eine Auswahl verschiedener Dateitypen per ‘Drag and Drop’ übertragen (z. B. eine .dc- und eine .dat-Datei), erscheinen die einzelnen Importoptionen nicht in der Liste. Wählen Sie die Voreinstellung aus der Liste, um die Importoptionen für jeden Dateityp zu verwenden. Trimble Geomatics Office verwendet die Dateierweiterungen und bestimmt die Dateiformate, die Sie importieren. Es gibt jedoch keine Garantie, daß die Software das richtige Dateiformat wählt.

  Mit der linken Maustaste können Sie mehrere Dateien verschiedener Typen per ‘Drag and Drop’ übertragen. Trimble Geomatics Office verwendet die Dateierweiterungen und bestimmt die Dateiformate, die Sie importieren. Es gibt jedoch keine Garantie, daß die Software das richtige Dateiformat wählt.

HINWEIS: Wenn Trimble Geomatics Office keines der Formate erkennt, die per ‘Drag and Drop’ importiert werden sollen, erscheint ein Kontextmenü mit der Option, das Format als Datenrekorder-Datei eines Drittanbieters oder als NMEA-Datei zu importieren. Wenn Sie die voreingestellte Option wählen, versucht Trimble Geomatics Office, das Format als NMEA-Datei zu importieren.

Benutzerdefinierte Formate

Alle von Ihnen erstellten benutzerdefinierten Formate erscheinen im Kontextmenü, wenn Sie die rechte Maustaste verwenden, um eine Datei per ‘Drag and Drop’ in ein Trimble Geomatics Office-Projekt zu übertragen.

TIP: Wenn Sie kein Projekt geöffnet haben, können Sie die Datei Options.ini eines Projekts per ‘Drag and Drop’ auf Trimble Geomatics Office übertragen, um das Projekt zu öffnen.


Kontextmenüs

Die Befehle von Kontextmenüs variieren, je nachdem, wo sich der Mauszeiger befindet.

Sie können Kontextmenüs für allgemeine Aufgaben verwenden, z. B. zum:

  Zugriff auf allgemein verwendete Menübefehle und Dialogfelder

  Umschalten von Anzeigeeinstellungen

  Einfügen von Feldcodes

So können Sie ein Kontextmenü anzeigen:

1.	Bewegen sie den Mauszeiger über die entsprechende Position

2.	Klicken Sie mit der rechten Maustaste


Zugriffstasten

Über Zugriffstasten (Hot Keys) können Sie über die Tastatur schnell eine Option aus einem Menü oder Dialogfeld wählen. Zugriffstasten erscheinen als unterstrichene Buchstaben in der Beschriftung der Option.

Drücken Sie die Taste auf der Tastatur, die dem unterstrichenen Buchstaben in der gewünschten Option entspricht.


Koordinatensysteme - Überblick
Koordinatensysteme − Überblick

Weitere Informationen

Wie kann ich ...	Dialogfeld	Siehe auch
Überblick

Trimble Geomatics Office verwendet ein Koordinatensystem, um Messungen auf einer runden Oberfläche (der Erde) auf eine ebene Oberfläche (eine Karte oder einen Plan) zu transformieren. Beispiel: Ein Koordinatensystem wird verwendet, um Gitter-Koordinaten für einen Punkt zu berechnen, der mit GPS gemessen wurde (GPS-Messungen werden auf dem WGS-84-Ellipsoid durchgeführt).

Ein Koordinatensystem kann aus folgenden Elementen bestehen:

  einer Datum-Transformation (zwischen dem WGS-84-Ellipsoid und dem örtlichen Ellipsoid)

  einer Projektion

  einem Geoid-Modell

  einer GPS-Kalibrierung (bestehend aus einer horizontalen Ausgleichung und einer vertikalen Ausgleichung)

Sie müssen für jedes Projekt ein Koordinatensystem wählen. Wenn Sie kein System haben (oder nicht wissen, welches Sie wählen sollen), können Sie auch die voreingestellte Projektion verwenden.

HINWEIS: Stellen Sie sicher, daß sich die Punkte in einem Projekt in einer vernünftigen Entfernung vom Ursprung befinden, entsprechend der Eigenschaften der verwendeten Projektion.

Koordinatensystem-Datenbank

Die Koordinatensystem-Datenbank ist in einer Datei mit Namen Current.csd gespeichert. Sie enthält alle Koordinatensysteminformationen. Trimble liefert eine umfangreiche Auswahl von veröffentlichten Koordinatensystemen aus der ganzen Welt. Um Koordinatensystem, Zonen, örtliche Anpassungen, Datum-Transformationen, Ellipsoide und Geoid-Modelle zu definieren und zu bearbeiten, verwenden Sie das Coordinate System Manager-Programm.

Ein Koordinatensystem wählen

Sie können folgendes für die Auswahl eines Projekt-Koordinatensystems verwenden:

  ein Koordinatensystem und eine Zone aus der Koordinatensystem-Datenbank

  eine örtliche Anpassung aus der Koordinatensystem-Datenbank

  eine undefinierte voreingestellte Projektion

  eine definierte voreingestellte Projektion

  das in einer Survey Controller-Datei (*.dc) beim Importieren festgelegte Koordinatensystem

Wenn Sie in Trimble Geomatics Office ein Koordinatensystem wählen, werden die Parameter aus der Koordinatensystem-Datenbank entnommen.

Ein Koordinatensystem für ein Projekt ändern

Führen Sie einen der folgenden Schritte aus, um das Koordinatensystem für ein Projekt zu ändern:

  Legen Sie ein neues Koordinatensystem im Dialogfeld Projekteigenschaften fest.

  Importieren Sie eine Survey Controller .dc-Datei mit einem anderen Koordinatensystem in ein Trimble Geomatics Office-Projekt. Wenn das Projekt ein Koordinatensystem hat, und in der .dc-Datei ein anderes Koordinatensystem enthalten ist, entdeckt die Software beim Importieren den Unterschied und fordert Sie auf, zu wählen, welches Koordinatensystem verwendet werden soll. Sie können das Koordinatensystem für ein Projekt auf diese Weise ändern, wenn Sie sich dafür entscheiden, das System der .dc-Datei zu verwenden.

Wenn Sie das Koordinatensystem für ein Projekt ändern, berechnet Trimble Geomatics Office die Koordinaten aller Punkte neu. Die Koordinaten werden vom alten Koordinatensystem in das neue Koordinatensystem transformiert. Der allgemeine Vorgang dafür ist wie folgt:

1.	Alle Koordinaten werden auf das Ellipsoid reduziert (das Ellipsoid ist normalerweise das WGS-84-Ellipsoid; wenn nur die Projektion geändert wurde, ist es das örtliche Ellipsoid).

2.	Neue Koordinaten werden unter Verwendung der neuen Parameter berechnet.

Diese Schritte sind in der folgenden Abbildung dargestellt:

Wenn ein Geoid-Modell oder eine vertikale Ausgleichung Teil des alten Koordinatensystems sind, wird dieses verwendet, um die WGS-84-Höhen für alle Punkte zu berechnen, die nicht von Feldbeobachtungen abgeleitet wurden. Gleichermaßen, wenn ein Geoid-Modell oder eine vertikale Ausgleichung im neuen Koordinatensystem angewendet werden, wird dies verwendet, um die neue orthometrische Höhe der Gitter-Koordinaten aus den WGS-84-Höhen zu berechnen.

Wie sich eine Änderung des Koordinatensystems auf RoadLink und DTMLink auswirkt

Wenn Sie Punkte aus dem Projekt in Trimbles RoadLink- oder DTMLink-Dienstprogramm exportieren, werden die exportierten Punkte nicht mit den nachfolgenden Änderungen am Trimble Geomatics Office-Projekt aktualisiert.

Trimble empfiehlt, Punkte erst zu exportieren, nachdem alle Änderungen am Trimble Geomatics Office-Projekt abgeschlossen sind.

Wenn Sie bereits Punkte aus dem Trimble Geomatics Office-Projekt in RoadLink oder DTMLink exportiert haben und im Trimble Geomatics Office-Projekt das Koordinatensystem ändern oder die Daten kalibrieren, erscheint folgende Warnung:

Die Koordinaten für Punkte in DTMLink und RoadLink werden nicht aktualisiert, wenn Sie das Koordinatensystem ändern.

Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf OK, um anzuerkennen, daß sich die Koordinaten des Punkts in RoadLink oder DTMLink nicht ändern werden.

 Klicken Sie auf Abbrechen, um die Änderung abzubrechen.

So können Sie sicherstellen, daß im RoadLink- und DTMLink-Dienstprogramm die aktuellsten Koordinaten verwendet werden:

1.	Löschen Sie die unerwünschten Punkte in RoadLink- und/oder DTMLink.

2.	Exportieren Sie die Punkte erneut aus dem Trimble Geomatics Office-Projekt.


Bodenkoordinatensystem

Wenn Sie Bodenkoordinaten anstelle von Projektionskoordinaten benötigen, verwenden Sie ein Bodenkoordinatensystem. Wenn Sie ein Bodenkoordinatensystem wählen, entsprechen die Gitterstrecken den Bodenstrecken.

Wenn Sie Bodenkoordinaten in Trimble Geomatics Office verwenden möchten, müssen Sie:

1.	Ein Koordinatensystem für das Projekt definieren.

2.	Koordinaten für den Projektstandort eingeben. Der Projektstandort wird als örtlicher Breitengrad und Längengrad gespeichert.

3. 	Den Bodenmaßstabsfaktor eingeben oder ihn unter Verwendung der Koordinaten für den Projektstandort berechnen.

Ein Koordinatensystem für das Projekt definieren

Informationen darüber, wie ein Koordinatensystem in einem Trimble Geomatics Office-Projekt gewählt und geändert wird, finden Sie unter dem Thema Koordinatensystem - Überblick.

Koordinaten für den Projektstandort eingeben

Führen Sie hierzu folgende Schritte aus:

1.	Wählen Sie Datei / Projekteigenschaften. Das Dialogfeld Projekteigenschaften erscheint.

2.	Wählen Sie das Register Koordinatensystem.

3.	Klicken Sie in der Gruppe Einstellungen örtliche Anpassung auf Ändern. Das Dialogfeld Einstellungen örtliche Anpassung erscheint.

4.	Geben Sie in die Gruppe Projektstandort die entsprechenden Koordinaten ein. Wenn das Koordinatensystem nicht definiert ist, werden Sie aufgefordert, das Koordinatensystem zu aktualisieren.

Der Breitengrad und der Längengrad müssen ungefähr angegeben werden. Die orthometrische Höhe muß eine angemessene Schätzung der Höhe sein, geben Sie deshalb die mittlere Höhe des Projektes ein.

Bodenmaßstabsfaktor

Führen Sie hierzu folgende Schritte aus:

1.	Aktivieren Sie im Dialogfeld Einstellungen örtliche Anpassung das Kontrollkästchen Bodenkoordinaten verwenden, und führen Sie einen der folgenden Schritte aus:

  Geben Sie den Bodenmaßstabsfaktor ein.

  Aktivieren Sie das Kontrollkästchen Maßstabsfaktor aus Projektstandort berechnen. Die Software berechnet den Bodenmaßstabsfaktor aus den Werten in der Gruppe Projektstandort.

  Bestimmen Sie, wie die Bodenkoordinaten angezeigt werden sollen. Sie können ein Hochwert- und/oder Rechtswert-Offset oder vier- oder fünfstellige Koordinaten angeben. Verwenden Sie diese Option, um leicht zwischen Koordinaten unterscheiden zu können.

HINWEIS: Beim Bodenkoordinatensystem wird davon ausgegangen, daß Sie in der Nähe des Projektstandortes arbeiten, und daß es keine großen Veränderungen in der Projekthöhe gibt.

Der Bodenmaßstabsfaktor wird berechnet durch:

1.	Bestimmen der Referenzhöhe (h)

2.	Berechnen des Höhenfaktors

wobei:

SF der Maßstabsfaktor der Projektion ist

R der ellipsoidische Radius ist

h die Referenzhöhe ist

a die Große Halbachse ist

e2 die Exzentrizität im Quadrat ist

φ der Ursprungsbreitengrad der Projektion ist

3. 	Berechnen des Bodenmaßstabsfaktors am Schwerpunkt des Projektstandorts

 wobei:

s der Maßstabsfaktor Gitter am Projektstandort ist

Bodenkoordinatensysteme werden in der Trimble Survey Controller Version 10 komplett unterstützt. Die folgenden Hinweise enthalten Informationen zu Bodenkoordinatensystemen in der Trimble Survey Controller Version 7.7 und niedriger.

HINWEISE:

Projekte mit Bodenkoordinaten von Trimble Survey Controller-Versionen 7.5 – 7.7 importieren

Wenn Sie ein Trimble Survey Controller-Projekt (Version 7.5 oder 7.7) mit einer Transversal-Mercator-Projektion importieren, in der ein Bodenmaßstabsfaktor definiert wurde (z. B. ein Projekt ohne Projektion/ohne Datum mit einer Kalibrierung), lassen Sie das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung deaktiviert, sonst wird der Bodenmaßstabsfaktor zweimal angewandt.

Wenn Sie ein Trimble Survey Controller-Projekt mit einem definierten Bodenmaßstabsfaktor in ein Trimble Geomatics Office-Projekt importieren, in dem kein Bodenkoordinatensystem definiert ist, informiert Sie eine Warnmeldung, daß die Koordinatensysteme in den Projekten unterschiedlich sind. Verwenden Sie das Koordinatensystem im Trimble Geomatics Office-Projekt, und wählen Sie dann das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung.

Projekte mit Bodenkoordinaten zu Trimble Survey Controller-Versionen 7.5 – 7.7 exportieren

Wenn Sie ein Trimble Geomatics Office-Projekt mit einem definierten Bodenkoordinatensystem zu Trimble Survey Controller exportieren (Version 7.7 oder niedriger), ändert sich das Koordinatensystem geändert, wenn Sie es erneut in die Trimble Geomatics Office-Software importieren. Stellen Sie sicher, daß Sie das Trimble Geomatics Office-Koordinatensystem akzeptieren.

Trimble Survey Controller (Version 7.7 oder niedriger) unterstützt keine Bodenkoordinaten mit einer Lambert Konform Konischen 2 Parallelen-Projektion. Das Koordinatensystem wird mit einer Lambert Konform Konischen 1 Parallele-Projektion von Trimble Geomatics Office zu Trimble Survey Controller exportiert.

Trimble Survey Controller (Version 7.7 oder niedriger) unterstützt keine Bodenkoordinaten mit einer Albers Gleiche Fläche Konischen Projektion. Wenn Sie ein Projekt mit einer definierten Albers Gleiche Fläche Konischen Projektion zur Trimble Survey Controller-Software exportieren, entfernen Sie die Bodenkoordinaten, oder ändern Sie die Projektionen.


Datum-Transformationen - Überblick
Datum-Transformationen  − Überblick

Weitere Informationen

 Siehe auch

Überblick

Eine Datum-Transformation ist ein Satz von Parametern, die verwendet werden, um Koordinaten von einem Ellipsoid (z. B. das WGS-84-Ellipsoid) in Koordinaten auf dem örtlichen Ellipsoid zu konvertieren. (Das örtliche Ellipsoid ist das Ellipsoid, das von der Projektion verwendet wird). Eine Datum-Transformation ist Teil der Koordinatensystem-Definition.

Die folgenden Methoden zur Datum-Transformation sind verfügbar:

  Molodensky (Drei Parameter)

  Sieben Parameter

  Datum-Gitternetz

  Mehrfachregression

Alle Methoden sind in der Koordinatensystem-Datenbank gespeichert.

Um neue Datum-Transformationen zu definieren, bearbeiten Sie die Koordinatensystem-Datenbank mit dem Coordinate System Manager-Programm.


Datum-Transformation - Molodensky (Drei-Parameter)
Datum-Transformation − Molodensky (Drei-Parameter)

 Überblick und weitere Informationen

Die Molodensky-Datum-Transformation definiert eine Verschiebung in die X-, Y- und Z-Richtungen vom Ursprung des WGS-84-Ellipsoids und dem Ursprung des örtlichen Ellipsoids (oder umgekehrt).

Die Molodensky-Datum-Transformation wird manchmal auch Drei-Parameter-Datum-Transformation genannt.

Details ansehen

Wenn Sie eine Molodensky-Datum-Transformation als Teil des Projekt-Koordinatensystems definiert haben, können Sie die Werte der Datum-Transformation ansehen.

Verwenden Sie hierzu das Dialogfeld Koordinatensystem-Details.

Diese Felder definieren eine dreidimensionale kartesische (X, Y, Z) Transformation vom Ursprung des WGS-84-Ellipsoids zum Ursprung des örtlichen Ellipsoids.

Datum-Transformationen werden in der Koordinatensystem-Datenbank (Current.csd) gespeichert. Verwenden Sie das Coordinate System Manager-Programm, um sie zu bearbeiten.


Datum-Transformation - Sieben-Parameter
Datum-Transformation − Sieben-Parameter

 Überblick und weitere Informationen

Die Sieben-Parameter-Datum-Transformation definiert eine Transformation vom WGS-84-Ellipsoid auf ein örtliches Ellipsoid oder von einem örtlichen Ellipsoid auf das WGS-84-Ellipsoid.

Verschiebung

Diese Felder definieren eine dreidimensionale kartesische (X, Y, Z) Transformation vom Ursprung des WGS-84-Ellipsoids auf den Ursprung des örtlichen Ellipsoids.

Rotation

Die Rotationswerte definieren die entsprechenden Rotationswinkel um die X-, Y- und Z-Achsen. Dies sind die Winkel, um die die kartesischen Achsen des WGS-84-Ellipsoids gedreht werden müssen, um an den Achsen des örtlichen Ellipsoids ausgerichtet zu werden.

Der Rotationswinkel ist positiv für eine Drehung gegen den Uhrzeigersinn um jede Achse, vom positiven Ende der Achse aus gesehen.

Maßstabsfaktor

Alle Koordinaten werden mit diesem Wert multipliziert. Er ist in Teilen pro Million definiert. Wenn der Maßstabsfaktor 6,02 ist, werden alle Koordinaten mit 1,00000602 multipliziert.

Details ansehen

Wenn Sie eine Sieben-Parameter-Datum-Transformation als Teil des Projekt-Koordinatensystems definiert haben, können Sie die Werte der Datum-Transformation ansehen.

Verwenden Sie hierzu das Dialogfeld Koordinatensystem-Details − Register Datum-Transformation.

Datum-Transformationen werden in der Koordinatensystem-Datenbank (Current.csd) gespeichert. Verwenden Sie das Coordinate System Manager-Programm, um sie zu bearbeiten.


Datum-Transformation - Datum-Gitternetz
Datum-Transformation − Datum-Gitternetz

 Überblick und weitere Informationen

Eine Datum-Gitternetz Datum-Transformation ist eine veröffentlichte Datei, die Werte für die Parameter der Datum-Transformation des Gebiets enthält. Die Datei wird verwendet, um die Werte der Datum-Transformation an Ihrem Standpunkt zu interpolieren.

Um ein Datum-Gitternetz als Teil der Definition des Projekt-Koordinatensystems zu verwenden, müssen Sie eine Datum-Transformation wählen, die durch eine Breitengrad- und Längengrad-Datum-Gitternetz-Datei (*.dgf) definiert ist.

Verwenden Sie das Coordinate System Manager-Programm, um eine Datum-Transformation mit Datum-Gitternetz-Dateien anzusehen oder zu erzeugen.

Um die Datum-Gitternetz-Datei im Feld verwenden zu können, müssen Sie die Datum-Gitternetz-Datei als kombinierte Datum-Gitternetz-Datei zu Trimble Survey Controller (Version 7.00 oder höher) übertragen.


Datum-Transformation  - Mehrfachregression
Datum-Transformation  − Mehrfachregression

 Überblick und weitere Informationen

Eine Mehrfachregressions-Datum-Transformation definiert eine Transformation zwischen dem WGS-84-Ellipsoid und einem örtlichen Ellipsoid durch Hinzufügen einer polynominalen Gleichung zur vorhergesagten Verschiebung im örtlichen Gebiet. Verwenden Sie das Coordinate System Manager-Programm, um eine Mehrfachregressions-Datum-Transformation hinzuzufügen.

Details ansehen

Wenn Sie eine Mehrfachregressions-Datum-Transformation als Teil des Projekt-Koordinatensystems definiert haben, können Sie die Werte der Datum-Transformation ansehen.

Verwenden Sie hierzu das Dialogfeld Koordinatensystem-Details − Register Datum-Transformation.

Datum-Transformationen werden in der Koordinatensystem-Datenbank (Current.csd) gespeichert. Verwenden Sie Coordinate System Manager-Programm, um sie zu bearbeiten.


Projektionen - Überblick
Projektionen − Überblick

Weitere Informationen

 Siehe auch

Überblick

Eine Projektion ist ein mathematischer Ausdruck für die gewölbte Oberfläche eines Ellipsoids auf einem rechtwinkligen Koordinatengitter.

Verwenden Sie eine Projektion, um örtliche geodätische Koordinaten in örtliche Gitter-Koordinaten umzuwandeln.

Gitter-Koordinaten werden geplottet, um Karten zu erzeugen, die die Oberfläche der Erde oder Teile dieser Oberfläche wiedergeben.

Verschiedene Länder und Regionen verwenden unterschiedliche Projektionen, um eine minimale Verzerrung in den Gitter-Koordinaten zu erhalten. Das Coordinate System Manager-Programm enthält eine große Anzahl von Projektionen (Beispiel: Transversal-Mercator und Lambert Eine Parallele). Weitere Informationen über spezifische Projektionen finden Sie in der Hilfe des Coordinate System Manager-Programms.

HINWEIS: Stellen Sie sicher, daß sich die Punkte in einem Projekt in einer vernünftigen Entfernung vom Ursprung befinden, entsprechend der Eigenschaften der verwendeten Projektion.

Verwenden Sie das Coordinate System Manger-Programm, um Projektionsparameter als Teil einer Koordinatensystem-Definition zu definieren.


Geoid-Modelle - Überblick
Geoid-Modelle − Überblick

Weitere Informationen

 Siehe auch

Überblick

Ein Geoid ist eine Oberfläche mit konstantem Gravitationspotential, das sich der Meereshöhe annähert.

Mit GPS beobachtete Punkte haben auf dem WGS-84-Ellipsoid basierende Höhen. Diese Höhen werden Ellipsoid-Höhen genannt.

Mit Hilfe eines Geoid-Modells können wir Höhen basierend auf den Ellipsoid-Höhen abschätzen.

Geoid-Modelle werden in Geoid-Gitternetz-Dateien (*.ggf) gespeichert. Eine ggf-Datei enthält Geoid-Abstände für eine Reihe von Positionen auf einem Gitternetz. Durch Interpolation können diese Geoid-Abstände für jeden Punkt berechnet werden, der in das Gitternetz fällt.

Wenn ein Geoid-Modell für jeden Punkt gewählt wird, der mit GPS vermessen wurde, verwendet Trimble Geomatics Office die .ggf-Datei, um den Geoid-Abstand (N) an diesem Ort zu interpolieren. Dann wird der Wert von der beobachteten Ellipsoid-Höhe (H) subtrahiert oder zur Höhe addiert. Dies ergibt eine ungefähre Höhe über der Meereshöhe (h) für den GPS-Punkt. Die Beziehung zwischen dem Geoid- und dem örtlichen Ellipsoid ist in der folgenden Abbildung dargestellt:

Verwenden Sie das Coordinate System Manager-Programm, um ein neues Geoid-Modell unter Verwendung einer bestehenden Geoid-Gitternetz-Datei zu definieren. Alle Geoid-Modelle in der Koordinatensystem-Datenbank sind verfügbar, wenn Sie ein Koordinatensystem für ein Projekt wählen.

Sie können Trimble Geomatics Office verwenden, um Geoid-Gitternetz-Dateien zu Trimble Survey Controller oder zur TDS Survey Pro CE-Software (Version 3.5 oder höher) zu exportieren und Untergitter von bestehenden Geoid-Gitternetz-Dateien zu erzeugen.

HINWEIS: Wenn Sie kein Geoid-Modell verwenden oder keine GPS-Kalibrierung durchführen, ist die Punkthöhe mit der Ellipsoid-Höhe identisch und entspricht nicht der wahren Höhe. Wenn ein Geoid-Modell im Projekt-Koordinatensystem verwendet wird, dann wird es zur Konvertierung zwischen örtlichen Ellipsoid-Höhen und Höhen für alle Punkttypen verwendet - nicht nur für GPS-Punkte.


Dialogfeld Koordinatensystem ändern - Koordinatensystem wählen
Dialogfeld Koordinatensystem ändern  − Koordinatensystem wählen

Verwenden Sie dieses Dialogfeld, um ein existierendes Koordinatensystem oder eine örtliche Anpassung zu wählen oder eine voreingestellte Projektion für das Projekt zu definieren.

Dieses Dialogfeld ist der erste Schritt eines Assistenten, der Sie durch die Auswahleinstellungen führt.

Klicken Sie auf Weiter, um vorwärts, und Zurück, um rückwärts durch die Auswahl-Dialogfelder zu blättern.

Trimble Geomatics Office verwendet Koordinatensysteme in der Koordinatensystem-Datenbank-Datei (Current.csd). Sie können die Parameter eines Koordinatensystems mit dem Coordinate System Manager-Programm bearbeiten.

Neues System

So wählen Sie ein neues Koordinatensystem und eine Zone, eine örtliche kalibrierte Anpassung, die in der Koordinatensystem-Datenbank gespeichert wurde, oder eine voreingestellte Projektion:

1.	Wählen Sie Neues System.

2.	Klicken Sie auf Weiter, um zum Dialogfeld Koordinatensystemtyp wählen zu gelangen.

3.	Verwenden Sie den Assistenten, um ein Koordinatensystem für das Projekt zu wählen.

Kürzlich verwendetes System

So wählen Sie ein Koordinatensystem aus der Liste der zehn zuletzt verwendeten Koordinatensysteme:

1.	Klicken Sie auf Kürzlich verwendetes System.

2.	Klicken Sie auf die Pfeiltasten, um durch die Zusammenfassungen der Systeme zu rollen.

3.	Wählen Sie das Koordinatensystem, das Sie für das Projekt verwenden möchten.

4.	Klicken Sie auf Fertig stellen.

HINWEIS: Wenn Sie zum ersten Mal die Koordinatensystem-Datenbank verwenden, erscheint das Dialogfeld Koordinatensystemtyp wählen (und nicht das Dialogfeld Koordinatensystem ändern – Koordinatensystem wählen). Dies ist der Fall, weil keine kürzlich verwendeten Systeme zur Auswahl stehen.

HINWEIS: Trimble Geomatics Office unterstützt nicht alle im Coordinate System Manager verfügbaren Koordinatensysteme. Wenn Sie ein Koordinatensystem wählen, das nicht unterstützt wird, erscheint folgende Meldung:

Unbekannter Koordinatensystemtyp


Dialogfeld Koordinatensystemtyp wählen

Verwenden Sie dieses Dialogfeld, um den Koordinatensystemtyp zu wählen, den Sie verwenden möchten.

Koordinatensystem und Zone

Wählen Sie diese Option, um ein Koordinatensystem aus der Koordinatensystem-Datenbank zu wählen.

Kalibrierte örtliche Anpassung

Wählen Sie diese Option um eine kalibrierte örtliche Anpassung zu wählen, die Sie zuvor in der Koordinatensystem-Datenbank gespeichert haben. Örtliche Anpassungen sind gespeicherte Koordinatensystem-Details für Meßstellen, die Parameter der GPS-Kalibrierung enthalten können.

Standardprojektion (Transversal-Mercator)

Wählen Sie diese Option, um die voreingestellte Projektion zu definieren.

Zurück

Klicken Sie auf Zurück, um zum Dialogfeld Koordinatensystem wählen zurückzukehren.

HINWEIS: Wenn Sie die Koordinatensystem-Datenbank zum ersten Mal verwenden, ist die Schaltfläche Zurück nicht verfügbar, weil keine kürzlich verwendeten Systeme zur Auswahl stehen.

Weiter

Klicken Sie auf Weiter. Abhängig von der Option, die Sie gewählt haben, erscheint eines der folgenden Dialogfelder:

  Dialogfeld Koordinatensystemzone wählen.

  Dialogfeld Kalibrierte Örtliche Anpassung wählen.

  Dialogfeld Standardprojektion (Transversal-Mercator).


Dialogfeld Koordinatensystemzone wählen

Verwenden Sie dieses Dialogfeld, um das Koordinatensystem für das Projekt aus der Liste der verfügbaren Koordinatensysteme in der Koordinatensystem-Datenbank zu wählen.

So können Sie die Eigenschaften einer Koordinatensystemgruppe oder -zone ansehen:

1.	Heben Sie die Koordinatensystemgruppe oder -zone hervor.

2.	Klicken Sie auf die rechte Maustaste, um das Kontextmenü aufzurufen, und wählen Sie Eigenschaften.

Koordinatensystemgruppe

Diese Liste enthält die Koordinatensysteme in der Koordinatensystem-Datenbank. Ein System enthält eine oder mehrere Zonen, die für verschiedene Gebiete definiert wurden.

Zone

Diese Liste enthält die für das gewählte Koordinatensystem verfügbaren Zonen. Eine Zone enthält eine Datum-Transformation (einschließlich eines Ellipsoids und eines Transformationsparametersatzes, um Daten vom WGS-84-Ellipsoid auf das örtliche Ellipsoid zu übertragen), ein Geoid-Modell und Projektionsparameter.

Zurück

Klicken Sie auf Zurück, um zum Dialogfeld Koordinatensystemtyp wählen zurückzukehren.

Weiter

Klicken Sie auf Weiter. Das Dialogfeld Geoid-Modell wählen erscheint.


Dialogfeld Kalibrierte Örtliche Anpassung wählen

Verwenden Sie dieses Dialogfeld, um eine kalibrierte örtliche Anpassung aus der Liste der kalibrierten örtlichen Anpassungen in der Koordinatensystem-Datenbank zu wählen. Örtliche Anpassungen werden in der Koordinatensystem-Datenbank gespeichert. Sie erzeugen örtliche Anpassungen mit dem Coordinate System Manager-Programm oder mit Trimble Geomatics Office (in Datei / Projekteigenschaften / Register Koordinatensystem oder Vermessung / GPS-Kalibrierung).

So können Sie die Eigenschaften einer örtlichen Anpassung ansehen:

1.	Heben Sie den Namen der örtlichen Anpassung hervor.

2.	Klicken Sie die rechte Maustaste, um das Kontextmenü aufzurufen, und wählen Sie Eigenschaften.

Örtliche Anpassungsdetails

Diese Gruppe zeigt die Datum-Transformation und das Geoid-Modell für die hervorgehobene örtliche Anpassung an.

Zurück

Klicken Sie auf Zurück, um zum Dialogfeld Koordinatensystemtyp wählen zurückzukehren.

Fertig stellen

Klicken Sie auf Fertig stellen, um die Definition des Koordinatensystems zu beenden und zum Dialogfeld Projekteigenschaften zurückzukehren. Die von Ihnen gewählte Definition der örtlichen Anpassung ist das Koordinatensystem für das Projekt.

HINWEIS: Sie können das Geoid-Modell einer örtlichen Anpassung in Trimble Geomatics Office nicht ändern. Das für die örtliche Anpassung festgelegte Geoid-Modell wird verwendet. Verwenden Sie das Coordinate System Manager-Programm, um das Geoid-Modell für eine örtliche Anpassung zu ändern. Mit diesem Programm können Sie die örtliche Anpassung bearbeiten.


Dialogfeld Standardprojektion (Transversal-Mercator)

Verwenden Sie dieses Dialogfeld, um die Parameter für die voreingestellte Projektion festzulegen. Trimble Geomatics Office kann die Werte berechnen, oder Sie können sie eingeben.

Projektionsparameter automatisch berechnen

Aktivieren Sie dieses Kontrollkästchen, um Trimble Geomatics Office so zu konfigurieren, daß automatisch die erste in das Projekt eingegebene WGS-84-Position als Ursprung und die erste Gitternetz-Koordinate (Hochwert und Rechtswert) verwendet werden, um den falschen Hochwert und den falschen Rechtswert zu berechnen.

HINWEIS: Sie müssen auch das Süd-Azimutsystem (falls erforderlich) und die positive Koordinatenrichtung angeben. Trimble Geomatics Office aktualisiert diese Felder nicht automatisch.

Deaktivieren Sie dieses Kontrollkästchen, um Projektionsparameter einzugeben. Die folgenden Felder im Dialogfeld werden verfügbar. Geben Sie die Werte in diese Felder ein.

Zentraler Breitengrad

Geben Sie den Breitengrad des Ursprungs der Projektion ein.

Zentraler Längengrad

Geben Sie den Längengrad des Ursprungs der Projektion ein.

Falscher Hochwert und Falscher Rechtswert

Geben Sie den falschen Hochwert und den falschen Rechtswert für die voreingestellte Projektion ein. Der falsche Rechtswert und der falsche Hochwert sind die Gitternetz-Koordinaten des Ursprungs der voreingestellten Projektion.

Maßstabsfaktor

Geben Sie den Maßstabsfaktor für den Ursprung ein. Er sollte auf einem bekannten Maßstabsfaktor für die Projektion basieren. Er gibt das Verhältnis der Strecke auf der Projektion zur Strecke auf der Erdoberfläche wieder. Alle Bodenkoordinaten werden mit diesem Wert multipliziert, um Gitternetz-Strecken zu erhalten.

Süd-Azimutsystem

Wählen Sie dieses Feld, um ein Süd-Azimutsystem festzulegen. Ein Süd-Azimutsystem verwendet Süden als Null-Grad Azimut. Es wird auf Hawaii und in Südafrika verwendet (andere Systeme verwenden Norden als Null-Grad Azimut).

Positive Koordinatenrichtung

Wählen Sie die Optionen, um die Richtung anzugeben, in der die Koordinatenwerte erhöht werden sollen.

Zurück

Klicken Sie auf Zurück, um zum Dialogfeld Koordinatensystemtyp wählen zurückzukehren.

Weiter

Wenn Sie fertig sind, klicken Sie auf Weiter. Das Dialogfeld Geoid-Modell wählen erscheint.


Dialogfeld Geoid-Modell wählen

Verwenden Sie dieses Dialogfeld, um ein Geoid-Modell für das Projekt zu wählen. Wenn ein Geoid-Modell für das Koordinatensystem in der Koordinatensystem-Datenbank definiert ist, wird das Geoid-Modell automatisch gewählt.

Ein Geoid-Modell ist eine mathematische Oberfläche, das aus Geoid/Ellipsoid-Abständen besteht. Es ist eine Abschätzung des Abstands zwischen dem WGS-84-Ellipsoid und der Meereshöhe. Ein Geoid-Modell wird verwendet, um ungefähre orthometrische Höhen für GPS-Punkte abzuleiten.

Kein Geoid-Modell

Wählen Sie diese Option, wenn kein Geoid-Modell für das Koordinatensystem festgelegt werden soll. Wenn Sie kein Geoid-Modell angeben, ist die Höhe eines Punktes die Höhe über dem örtlichen Ellipsoid.

Wenn Sie diese Option wählen, empfiehlt Trimble, eine GPS-Kalibrierung durchzuführen, um genauere Höhen für die GPS-Beobachtungen zu erhalten.

Vordefiniertes Geoid-Modell

Wählen Sie ein Geoid-Modell aus der Liste. Die Liste der Geoid-Modelle stammt aus der Koordinatensystem-Datenbank (Current.csd).

Abhängig von der Genauigkeit des Geoid-Modells wird der aus der WGS-84-Höhe und dem Geoid-Abstand abgeleiteten Höhe eine Qualität zugewiesen. Verwenden Sie das Feld Qualität Geoidmodell im Dialogfeld Projekteigenschaften / Register Neu berechnen, um die Qualität des Geoid-Modells festzulegen. Die Qualität des Geoid-Modells wird verwendet, um die Qualität des Höhenfeldes für Punkte zu kennzeichnen.

Zurück

Klicken Sie auf Zurück, um zum Dialogfeld Koordinatensystemzone wählen oder zum Dialogfeld Standardprojektion (Transversal-Mercator) zurückzukehren.

Fertig stellen

Klicken Sie auf Fertig stellen, um die Definition des Koordinatensystems zu beenden und zum Dialogfeld Projekteigenschaften zurückzukehren.


Örtliche Anpassungen - Überblick
Örtliche Anpassungen − Überblick

Eine örtliche Anpassung wird verwendet, um örtliche GPS-Kalibrierungsdetails im bestehenden Koordinatensystem und der Zone zu speichern.

Wenn Sie eine GPS-Kalibrierung durchgeführt haben, können Sie diese und das Koordinatensystem in der Koordinatensystem-Datenbank als örtliche Anpassung speichern, damit Sie sie leicht wiederverwenden können.

Führen Sie einen der folgenden Schritte aus, um eine örtliche Anpassung zu speichern:

  Wählen Sie Vermessung / GPS-Kalibrierung.

  Wählen Sie Datei / Projekteigenschaften / Register Koordinatensystem.

Alternativ hierzu können Sie auch mit dem Coordinate System Manager-Programm eine neue örtliche Anpassung erzeugen. Wenn Sie dieses Programm verwenden, erscheinen die gespeicherten örtlichen Anpassungen im Register Örtliche Anpassungen.

Weitere Informationen finden Sie in der Hilfe des Coordinate System Manager-Programms.

HINWEIS: Sie können Ausgleichungstransformationsparameter nicht als örtliche Anpassung speichern.


Eine undefinierte voreingestellte Projektion verwenden - Überblick / Dialogfeld Voreingestellte Projektionsdefinition
Eine undefinierte voreingestellte Projektion verwenden − Überblick / Dialogfeld Voreingestellte Projektionsdefinition

Überblick

Eine undefinierte voreingestellte Projektion ist eine voreingestellte Projektion ohne Werte für den Ursprungsbreitengrad und Ursprungslängengrad. Wenn Sie zum ersten Mal Vermessungsdaten in ein Projekt eingeben, das eine undefinierte voreingestellte Projektion verwendet, erscheint das Dialogfeld Voreingestellte Projektionsdefinition. Sie werden aufgefordert, Projektionsparameter zu verwenden, die für die von Ihnen eingegebenen Daten geeignet sind. Verschiedene Felder im Dialogfeld sind verfügbar, abhängig vom Datentyp, der zum Projekt hinzugefügt wird. Folgendes ist möglich:

 GPS-Punkte zu einem Projekt hinzufügen (undefinierte voreingestellte Projektion), das Gitternetz-Punkte enthält

  Eine Datei mit einer definierten Projektion in ein Projekt mit einer undefinierten voreingestellten Projektion importieren

  Einen  WGS-84-Punkt zu einem Projekt hinzufügen (undefinierte voreingestellte Projektion)

  Eine Nur-Maßstab-Datei verwenden (undefinierte voreingestellte Projektion)

 Gitternetz-Punkte zu einem leeren Projekt hinzufügen

Verwenden Sie eine Projektvorlage ohne definiertes Koordinatensystem, um eine undefinierte voreingestellte Projektion zu verwenden (Beispiel: Die Vorlagen Trimble Metrisch und US Fuß).


Gitternetz-Punkte hinzufügen (undefinierte voreingestellte Projektion)

 Überblick und weitere Informationen

Das Dialogfeld Voreingestellte Projektionsdefinition erscheint, wenn die erste Position, die zum Trimble Geomatics Office-Projekt hinzugefügt wird, das eine undefinierte voreingestellte Projektion (kein Koordinatensystem) hat, eine Gitternetz-Position ist.

Das Dialogfeld Voreingestellte Projektionsdefinition enthält die folgenden Felder:

Falscher Hochwert

Der Hochwert am Ursprung der Projektion. Der Hochwert wird vom ersten Punkt der Datei abgeleitet. Sie können diesen Wert ändern.

Falscher Rechtswert

Der Rechtswert am Ursprung der Projektion. Der Rechtswert wird vom ersten Punkt der Datei abgeleitet. Sie können diesen Wert ändern.

OK

Klicken Sie auf OK, um die Parameter der voreingestellten Projektion zu akzeptieren. Diese Werte werden zur Definition des Projekt-Koordinatensystems verwendet. Wählen Sie Datei / Projekteigenschaften / Register Koordinatensystem, und klicken Sie auf Details, um diese Parameter anzusehen,

HINWEIS: Da die voreingestellte Projektion nicht vollständig definiert ist (Ursprungsbreitengrad und Ursprungslängengrad sind undefiniert), können Sie sie durch Importieren einer Datei, die einen oder mehrere GPS-Punkte enthält, aktualisieren.


GPS-Punkte zu einem Projekt hinzufügen (undefinierte voreingestellte Projektion), das Gitternetz-Punkte enthält

 Überblick und weitere Informationen

Das Dialogfeld Voreingestellte Projektionsdefinition erscheint, wenn das Trimble Geomatics Office-Projekt eine undefinierte voreingestellte Projektion hat (keinen Ursprungsbreitengrad und Ursprungslängengrad), eine oder mehrere Gitter-Positionen enthält und:

  eine Datei importiert wird, die mindestens einen GPS-Punkt enthält

oder

  ein WGS-84-Punkt eingegeben wird

Das Dialogfeld Voreingestellte Projektionsdefinition enthält die folgenden Felder:

Hochwert

Dieses Feld hat den Wert Null. Geben Sie die beste bekannte Hochwert-Koordinate für den GPS-Punkt ein, der zur Definition der voreingestellten Projektion verwendet wird.

Rechtswert

Dieses Feld hat den Wert Null. Geben Sie die beste bekannte Rechtswert-Koordinate für den GPS-Punkt ein, der zur Definition der voreingestellten Projektion verwendet wird.

Breitengrad

Der WGS-84-Breitengrad des ersten GPS-Punkts in der Datei wird hier angezeigt. Dieses Feld kann nicht bearbeitet werden.

Längengrad

Der WGS-84-Längengrad des ersten GPS-Punkts in der Datei wird hier angezeigt. Dieses Feld kann nicht bearbeitet werden.

OK

Klicken Sie auf OK, um die Gitternetz-Koordinaten für den GPS-Punkt zu akzeptieren. Die WGS-84-Breitengrad- und WGS-84-Längengradwerte für den Ursprung werden bestimmt, basierend auf den falschen Koordinaten des (bereits definierten) Ursprungs und den im Dialogfeld angegebenen Werten für den GPS-Punkt. Um alle Parameter anzuzeigen, wählen Sie Datei / Projekteigenschaften / Register Koordinatensystem, und klicken Sie auf Details.

HINWEIS: Wenn ein GPS-Punkt einmal zur Datenbank hinzugefügt wurde, ist die voreingestellte Projektion vollständig definiert. Von nun an werden die Parameter der voreingestellten Projektion nicht aktualisiert, wenn Sie eine Datei importieren oder einen Punkt zum Trimble Geomatics Office-Projekt hinzufügen. Sie können den Ursprung der Projektion jedoch aktualisieren, indem Sie eine GPS-Kalibrierung durchführen (wählen Sie Vermessung / GPS-Kalibrierung).


Einen WGS-84-Punkt zu einem Projekt hinzufügen (undefinierte voreingestellte Projektion)

Das Dialogfeld Voreingestellte Projektionsdefinition erscheint, wenn das Trimble Geomatics Office-Projekt eine undefinierte voreingestellte Projektion hat (kein Ursprungsbreitengrad und Ursprungslängengrad) und

  ein WGS-84-Punkt eingegeben wird

  ein WGS-84-Punkt importiert wird

Das Dialogfeld Voreingestellte Projektionsdefinition enthält die folgenden Felder:

Hochwert

Dieses Feld ist standardmäßig auf Null eingestellt. Geben Sie die beste bekannte Hochwert-Koordinate für den Punkt ein, der zur Definition der voreingestellten Projektion verwendet wird. Dieser Wert wird als falscher Hochwert für die Projektion verwendet.

Rechtswert

Dieses Feld ist standardmäßig auf Null eingestellt. Geben Sie die beste bekannte Rechtswert-Koordinate für den Punkt ein, der zur Definition der voreingestellten Projektion verwendet wird. Dieser Wert wird als falscher Rechtswert für die Projektion verwendet.

Ursprung Breite

Der WGS-84-Breitengrad des Punkts wird hier angezeigt. Dieses Feld ist der Breitengrad des Ursprungs für die Projektion. Dieses Feld kann nicht bearbeitet werden.

Ursprung Länge

Der WGS-84-Längengrad des Punkts wird hier angezeigt. Dieses Feld ist der Längengrad des Ursprungs für die Projektion. Dieses Feld kann nicht bearbeitet werden.

OK

Klicken Sie auf OK, um die Parameter der voreingestellten Projektion zu akzeptieren. Diese Werte werden zur Definition des Projekt-Koordinatensystems verwendet. Wählen Sie Datei / Projekteigenschaften / Register Koordinatensystem und klicken Sie auf Details, um diese Parameter anzusehen.

HINWEIS: Wenn die voreingestellte Projektion vollständig definiert ist, werden beim Importieren einer .dc-Datei oder beim Hinzufügen eines Punkts zum Trimble Geomatics Office-Projekt die Parameter der voreingestellten Projektion nicht aktualisiert. Sie können den Ursprung der Projektion jedoch aktualisieren, indem Sie eine GPS-Kalibrierung durchführen (wählen Sie Vermessung / GPS-Kalibrierung).


Eine Datei (mit einer definierten Projektion) in ein Projekt mit einer undefinierten voreingestellten Projektion importieren

 Überblick und weitere Informationen

Das in der Datei festgelegte Koordinatensystem wird automatisch zum Koordinatensystem des Projekts.

Eine Meldung wird in den Import-Bericht geschrieben. Sie lautet:

Importiertes und Projektkoordinatensystem waren unterschiedlich.
Die importierte Definition wurde der nicht definierten Voreinstellungsprojektion (Transversal-Mercator) vorgezogen.


Das Koordinatensystem aus einer Datei verwenden

 Überblick und weitere Informationen

Wenn eine Datei mit einem definierten Koordinatensystem importiert wird, wird die in der Datei aufgezeichnete Definition des Koordinatensystems mit der Koordinatensystemdefinition des Projekts verglichen. Wenn sie unterschiedlich sind, erscheint das Dialogfeld Projekt-Koordinatensystem.

Wählen Sie die Option Zur Definition des Datenrekorders konvertieren im Dialogfeld Projekt-Koordinatensystem, um das in der Datei festgelegte Koordinatensystem zu verwenden.

Wenn das Koordinatensystem in der Datei kein Nur-Maßstab-Koordinatensystem ist, wird die Definition des Koordinatensystems zur Koordinatensystemdefinition der Datei geändert.

Wenn das Koordinatensystem in der Datei Nur- Maßstab ist, hängt das weitere Vorgehen von dem für das Projekt definierten Koordinatensystem ab.

HINWEIS: Wenn das Projekt-Koordinatensystem eine undefinierte voreingestellte Projektion ist und keine Punkte hat, wird automatisch das Koordinatensystem in der Datei verwendet und das Projekt-Koordinatensystem zum Koordinatensystem der Datei geändert.


Totalstationsdateien (Nur Maßstab) mit einem undefinierten Koordinatensystem - Überblick

Überblick

Ein Nur-Maßstab-Koordinatensystem kann für Vermessungen verwendet werden, bei denen alle Beobachtungen mit einem konventionellen Instrument durchgeführt wurden (d. h. keine GPS-Beobachtungen).

Wie eine Datei gehandhabt wird, die ausschließlich terrestrische Beobachtungen enthält, hängt von dem im Trimble Geomatics Office-Projekt definierten Koordinatensystem ab.

Undefinierte voreingestellte Projektion

Wenn das Trimble Geomatics Office-Projekt eine undefinierte voreingestellte Projektion hat (keinen Ursprungsbreitengrad oder Ursprungslängengrad), erscheint das Dialogfeld Voreingestellte Projektion. Sie können den falschen Hochwert, den falschen Rechtswert und die Skalierungswerte eingeben.

WARNUNG: Wenn ein Punkt in der Datenbank bereits existiert, wird der Maßstab in der Datei nicht zur Aktualisierung der voreingestellten Projektion verwendet. Stellen Sie sicher, daß der Maßstab in der importierten Datei dem Maßstab in der voreingestellten Projektion des Projekts entspricht.

Definiertes Koordinatensystem

Wenn das Trimble Geomatics Office-Projekt ein definiertes Koordinatensystem hat (einschließlich der voreingestellten Projektion mit definierten Ursprungsbreitengrad- und Ursprungslängengradwerten), wird das Projekt-Koordinatensystem verwendet und davon ausgegangen, daß der Maßstab in der Datei mit dem Maßstab im Projekt-Koordinatensystem identisch ist.


Eine Nur-MaßstabDatei verwenden (undefinierte voreingestellte Projektion)
Eine Nur-Maßstab-Datei verwenden (undefinierte voreingestellte Projektion)

 Überblick und weitere Informationen

Das Dialogfeld Voreingestellte Projektionsdefinition erscheint, wenn:

 die Datei, die Sie importieren, eine Nur-Maßstabs-Projektion enthält

 das Trimble Geomatics Office-Projekt eine undefinierte voreingestellte Projektion hat (d. h. der Breitengrad und der Längengrad des Ursprungs sind nicht definiert)

  sich keine Punkte in der Datenbank befinden

Das Dialogfeld enthält die folgenden Felder:

Falscher Hochwert

Der Hochwert wird vom ersten Punkt in der Datei abgeleitet. Sie können die Werte für den falschen Ursprung ändern.

Falscher Rechtswert

Der Rechtswert wird vom ersten Punkt in der Datei abgeleitet. Sie können die Werte für den falschen Ursprung ändern.

Maßstabsfaktor

Der Maßstabsfaktor wird vom letzten Maßstabs-Datensatz der Datei abgeleitet. Sie können die Werte für den Maßstabsfaktor ändern.

HINWEIS: Wenn Sie nach dem ersten Punkt in der Datei suchen, werden gelöschte Punkte nicht berücksichtigt.

OK

Klicken Sie auf OK, um die Parameter der voreingestellten Projektion zu akzeptieren. Diese Werte werden zur Definition des Projekt-Koordinatensystems verwendet. Wählen Sie Datei / Projekteigenschaften / Register Koordinatensystem, und klicken Sie auf Details, um diese Parameter anzusehen,

HINWEIS: Da die voreingestellte Projektion nicht vollständig definiert ist (Ursprungsbreitengrad und Ursprungslängengrad sind nicht definiert), können Sie die voreingestellte Projektion durch Importieren einer Datei, die eine oder mehrere GPS-Positionen enthält, aktualisieren.

Die Meereshöhenkorrektur ist nur aktiviert, wenn das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung aktiviert ist.


Eine terrestrische Datei mit einem definiertem Projekt-Koordinatensystem verwenden

Wenn ein Koordinatensystem für das Trimble Geomatics Office-Projekt definiert ist, und Sie eine Datei importieren, erscheint eine Meldung, die darauf hinweist, daß das bestehende Koordinatensystem des Projekts verwendet wird. Die Punkte in der Datei werden dann importiert.

Trimble Geomatics Office nimmt an, daß der Projektmaßstab im bestehenden Koordinatensystem und der Bodenmaßstabsfaktor mit dem Maßstab in der Datei identisch sind.

Wenn das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung nicht gewählt ist, sollten Sie vor dem Importieren sicherstellen, daß die Maßstäbe identisch sind, und der Maßstabsfaktor in der Datei dem kombinierten Maßstabsfaktor entspricht.

Wenn das Kontrollkästchen Bodenkoordinaten verwenden im Dialogfeld Einstellungen örtliche Anpassung gewählt ist, vergewissern Sie sich, daß die Projekthöhe in Trimble Geomatics Office die richtige Höhe für die zu importierenden Daten ist.


Dialogfeld Projekt-Koordinatensystem

Dieses Dialogfeld erscheint, wenn eine Datei importiert wird, und sich die in der Datei aufgezeichnete Koordinatensystem-Definition von der Definition des Projekt-Koordinatensystems unterscheidet und das Projekt-Koordinatensystem definiert ist (das Projekt-Koordinatensystem keine undefinierte voreingestellte Projektion ist).

Koordinatensystem

Wenn Sie das Koordinatensystem in der Datei verwenden möchten, wählen Sie die Option Zur Definition des Datenrekorders konvertieren. Alle bestehenden Daten in der Datenbank werden unter Verwendung der neuen Koordinatensystem-Definition aktualisiert.

Wenn Sie die Definition des Projekt-Koordinatensystems, beibehalten möchten, wählen Sie die Option Die im Projekt existierende Definition beibehalten. Die Daten in der Datenrekorder-Datei werden unter Verwendung der Projekt-Koordinatensystemdefinition interpretiert.

Klicken Sie auf die entsprechende Detail-Schaltfläche, um die Details beider Koordinatensysteme anzusehen.

Zusammenfassung

Klicken Sie auf Zusammenfassung, um einen Vergleichsbericht der beiden Koordinatensysteme anzusehen. Verwenden Sie den Bericht, um alle Parameter der Koordinatensysteme zu überprüfen und die Unterschiede zwischen ihnen herauszufinden.


Das Dialogfeld Projekt-Koordinatensystem beim Importieren von Dateien verwenden

Wenn eine Datei importiert wird, wird die in der Datei aufgezeichnete Koordinatensystem-Definition mit der Koordinatensystem-Definition des Projekts verglichen. Um das im Projekt festgelegte Koordinatensystem zu verwenden, wählen Sie im Dialogfeld Projekt-Koordinatensystem die Option Die im Projekt existierende Definition beibehalten.

Undefinierte voreingestellte Projektion

Wenn das Projekt-Koordinatensystem eine undefinierte voreingestellte Projektion ist, erscheint das Dialogfeld  Voreingestellten Projektionsursprung aktualisieren. Der erste Punkt in der Datei wird zur Aktualisierung der voreingestellten Projektion verwendet.

Andere Koordinatensysteme

Die Datei wird unter Verwendung des Projekt-Koordinatensystems importiert.

HINWEIS: Wenn das Koordinatensystem in der Datei Nur-Maßstab ist, dann hängt das weitere Vorgehen von dem für das Projekt definierten Koordinatensystem ab.


Eine Ebenen-Projektion von Trimble Survey Office oder Trimble Survey Controller verwenden

Trimble Geomatics Office aktualisiert eine undefinierte Ebenen-Projektion nicht.

Wenn Sie einen der folgenden Schritte ausführen:

 eine Trimble Graphikdatei (*.tgf) aus Trimble Survey Office exportieren und das Trimble Survey Office-Projekt eine Ebenen-Projektion hat

 eine .dc-Datei aus dem Trimble Survey Office-Projekt mit einer Ebenen-Projektion exportieren

und danach die Datei in Trimble Geomatics Office importieren, kann die Ebenen-Projektion noch für das Trimble Geomatics Office-Projekt verwendet werden (Sie müssen die Option Koordinatensystem in der .dc-Datei wählen, wenn das Dialogfeld Projekt-Koordinatensystem erscheint).

Die Ebenen-Projektion wird zum gewählten Koordinatensystem des Projekts. Verwenden Sie Datei / Projekteigenschaften / Register Koordinatensystem, um die Details des Koordinatensystems anzusehen.


Eine Netzausgleichung mit Daten aus der Nur-Maßstab-Datei durchführen (undefinierte voreingestellte Projektion)
Eine Netzausgleichung mit Daten aus einer Nur-Maßstab-Datei durchführen (undefinierte voreingestellte Projektion)

Eine Datei mit terrestrischen Beobachtungen kann ein Koordinatensystem haben, für das außer einem Maßstab keine Parameter definiert wurden. Das bedeutet, es enthält keine Datum-Transformation, horizontale Ausgleichung oder vertikale Ausgleichung. Nur-Maßstab-Koordinatensysteme werden in Trimble Survey Controller (Version 7.00 oder höher) erzeugt.

Sie müssen ein Koordinatensystem definieren, bevor Sie eine Netzausgleichung durchführen können. Wenn Sie daher ein Nur-Maßstab-Koordinatensystem-Projekt von Trimble Survey Controller in ein undefiniertes voreingestelltes Projekt-Koordinatensystem in Trimble Geomatics Office importiert haben, fordert die Software Sie auf, die undefinierte voreingestellte Projektion zu aktualisieren.

Sie müssen in das Dialogfeld, das angezeigt wird, einen Breiten- und Längengrad für den Projektionsursprung und falsche Hochwert- und Rechtswert-Koordinaten eingeben.


Erdrotationsparameter

Wenn Sie sehr lange Basislinien verarbeiten (länger als 100 km), verwendet das Basislinienverarbeitungsprogramm Erdrotationsparameter, um Gezeiten zu modellieren.

Diese Erdrotationsparameter, speziell die Pol-Koordinaten, sind bei Organisationen wie z. B. dem International GPS Service (IGS) erhältlich. Sie sind wöchentlich als Dateien mit der Erweiterung .erp erhältlich. Wenn Basislinien mit einer Länge von über 100 km verarbeitet werden, und eine .erp-Datei für den Zeitraum der Basislinie nicht zur Verfügung steht, werden vorhergesagte Pol-Koordinaten verwendet.

Verwenden Sie den Windows Explorer, um alle relevanten .erp-Dateien in den Projektordner Data Files\Genaue Ephemeriden [Precise Ephemeris] zu kopieren. Das Basislinienverarbeitungsprogramm sucht im Ordner Genaue Ephemeriden automatisch nach diesen Dateien, wenn sie benötigt werden. Wenn das Programm sie nicht findet, verwendet es die vorhergesagten Werte.

HINWEIS: Wenn Sie eine .erp-Datei in mehreren Projekten verwenden, müssen Sie diese Datei in jedes Projekt kopieren, in dem sie verwendet werden soll.


US High Precision Geodetic Network-Gitternetz-Dateien verwenden

Die HPGN (High Precision Geodetic Network)-Datum-Gitternetz-Dateien für die US State Plane-Systeme sind Teil der Trimble Geomatics Office-Systeminstallation. Die Datum-Gitternetz-Dateien werden im Ordner GeoData unter dem Trimble-Ordner Gemeinsame Dateien (gewöhnlich Programme\Gemeinsame Dateien\Trimble\GeoData) gespeichert. HPGN-Datum-Gitternetz-Dateien sind nicht für alle Staaten der USA verfügbar.

Die Benennungskonvention für die Gitternetz-Dateien ist:

  Das aus zwei Zeichen bestehende Staatenkennzeichen + hpgn + la (Breitengrad) oder lo (Längengrad) mit der Dateierweiterung .dgf. Die California HPGN-Gitternetz-Dateien heißen z. B. Cahpgnla.dgf und Cahpgnlo.dgf.

Da die Koordinatensystemverwaltung in Trimble Geomatics Office auf WGS-84 basiert, passen die HPGN-Datum-Gitternetze (entworfen für die zweiseitig gerichtete Umwandlung zwischen NAD83 (1986) und NAD83 (HPGN)) nicht glatt in dieses Koordinatensystemmodell hinein. Aus diesem Grund, und zur Vermeidung von Unklarheiten, enthält die Software keine vordefinierten Koordinatensystemdefinitionen, die einen Bezug zu diesen Datum-Gitternetzen herzustellen.

Sie können Ihre eigenen Datum- und Koordinatensystemdefinitionen unter Verwendung der entsprechenden HPGN-Datum-Gitternetz-Dateien im Coordinate System Manager-Programm festlegen.

Führen Sie folgendes durch:

1. 	Erstellen Sie eine neue Datum-Definition, die den Bezug zu den entsprechenden HPGN-Datum-Gitternetz-Dateien für den betreffenden Staat herstellt.

2. 	Erstellen Sie eine neue Koordinatensystemdefinition unter Verwendung der entsprechenden State Plane-Projektionsparameter mit Bezug zur neu erstellten Datum-Definition.

Verwenden Sie die neue Koordinatensystemdefinition in einem Trimble Geomatics Office-Projekt, um NAD-83 (1986)-Breitengrad- und Längengradwerte, oder Breitengrad-, Längengrad- und Höhenwerte von bekannten HPGN-Projektionskoordinaten zu erhalten.

Führen Sie folgendes durch:

1. 	Geben Sie die HPGN-Werte als örtliche Breitengrad-, Längengrad- und Höhenwerte oder, falls erforderlich, als Gitternetz-Koordinaten ein.

2. 	Lesen Sie die äquivalenten NAD-83 (1986)-Breitengrad- und Längengradwerte in den angezeigten WGS-84-Feldern ab.

Sie erhalten HPGN-Werte wie folgt aus bekannten NAD-83 (1986)-Breitengrad-, Längengrad- und Höhenwerten:

1. 	Geben Sie die bekannten NAD-83 (1986)-Breitengrad-, Längengrad- und Höhenwerte als WGS-84-Werte ein.

2. 	Lesen Sie die äquivalenten HPGN-Gitternetz-Koordinaten oder Breitengrad-, Längengrad- und Höhenwerte aus den Gitter- bzw. örtlichen Feldern ab.


New Brunswick (Canada)-Koordinatensystem

Die Koordinatensystem-Datenbank verfügt jetzt über die Doppelt Stereographische Projektion und das Average Terrestrial System 1977 (ATS77)-Ellipsoid. Sie müssen das Datum-Gitternetz und das Geoid-Modell von Geodetic Survey of Canada käuflich erwerben, bevor Sie das New Brunswick-Koordinatensystem einrichten können.

Das New Brunswick (Canada)-Koordinatensystem verwendet:

  Ellipsoid: ATS77

  Datum: NTv2 Datum Grid

  Geoid: HT101

  Projektion: Doppelt Stereographisch

– Zentraler Breitengrad: 46° 30’ 00" N

– Zentraler Längengrad: 66° 30’ 00" W

– Falscher Hochwert: 800 000 m

– Falscher Rechtswert: 300 000 m

– Maßstabsfaktor: 0,999912

So erstellen Sie das New Brunswick (Canada)-Koordinatensystem:

1. 	Verwenden Sie das Grid Factory-Programm, um Geoid-Gitternetz (*.ggf)-Dateien aus dem HT101-Geoid-Modell zu erstellen, das von Geodetic Survey of Canada käuflich erworben wurde.

2. 	Verwenden Sie das Grid Factory-Programm, um Datum-Gitternetz (*lat.dgf, *lon.dgf)-Dateien aus dem NTv2 Datum-Gitternetz zu erstellen, das von Geodetic Survey of Canada käuflich erworben wurde. Weitere Information finden Sie in der Hilfe des Grid Factory-Programms.

3.	Verwenden Sie das Coordinate System Manager-Programm, um ein neues Koordinatensystem hinzuzufügen. Weitere Information finden Sie unter dem Thema Befehl Koordinatensystem hinzufügen in der Hilfe des Coordinate System Manager-Programms.


Glossar

Dieses Glossar enthält Ausdrücke, die für GPS und die Trimble Geomatics Office Software spezifisch sind. Es enthält keine Terminologie für Microsoft Windows oder allgemeine Computerbegriffe.

Symbole

1-Sigma

A

AASHTO

Abplattung Richtungswinkel/Strecke

Abplattung

Abschluß

Aktuelle Ansicht

Algebraisches Zeichen

Algorithmus

Almanach

Anmerkung

Antennenhöhe

Antennenphasenkorrektur

Anti-Spoofing (AS)

APC

A-Posteriori-Fehler

A-Priori-Fehler

Ausgeglichene Werte

Ausgleichung

Ausgleichungsdatum

Ausgleichungskonvergenz

Ausgleichungsstile

Ausreißer

Autonome Positionierung

Azimut

B

Basislinie

Basislinienverarbeitungsprogramm

Basisstation

Baud

Bedeutungsgrad

Bedingt

Bedingung

Beobachtungen

Beobachtungsrestwert

Besetzungszeit

Beschriftung

Bivariate

Bodenstrecke

C

CAD-Stile

Chi-Quadrat Test

CMR

Coarse Acquisition (C/A)-Code

Code

D

Datenaufzeichnung

Datenmeldung

Datum-Defekt

Datum

Datum-Transformation

Delta Hochwert, Delta Rechtswert, Delta Höhe

Delta Höhe

Delta X, Delta Y, Delta Z

DGM

Differentielle Positionierung

DOP

Doppelte Differenzierung

Doppler-Verschiebung

Dreifuß

Dreifuß-Zentrierfehler

E

Geozentrische kartesische Koordinaten (ECEF)

Echtzeit-Kinematisch

Einfrequenz

Elemente

Ellipsoid

Ellipsoidische Höhe

Ellipsoidischer Azimut

Ellipsoid-Strecke

Endgültige Lösung

Ephemeriden

Epoche

Epochenintervall

Ereignisse

F

FastStatic

Fehlerellipse

Fehler

Feldcodes

Festgehaltene Koordinaten

Fest

Festpunkt

Fixed-Lösung

Float-Lösung

Fortgepflanzter Fehler

Freie Ausgleichung

Freiheitsgrade

G

Ganzzahlige Mehrdeutigkeit

Ganzzahlsuche

GDOP

Genaue Ephemeriden

Genauigkeit

Präzision

Geodätischer Azimut

Geodätisches Datum

Geographische Koordinaten

Geoid-Abstand

Geoid-Beobachtung

Geoid

Geoidmodell

Geomatics

Gewicht

Gewichtungen

Gewichtungsstrategie

Gitternetz

Gitternetzumwandlung

Gitterstrecke

GPS-Basislinie

GPS-Beobachtungen

GPS

GPS-Rohdaten

GPS-Zeit

Große Achse

Große Halbachse

H

Häufigkeitsverteilung

HDOP

Histogramm

Hochwert

Höhe

Höhenmaske

Höhenmeßstab

Höhenunterschied

Horizontale Position

Horizontale Strecke

Horizontaler Festpunkt

I

IH

Initialisierung über bekanntem Punkt

Innere Bedingung

Iono-frei

Ionosphäre

Ionosphärenmodellierung

Iteration

J

K

Kalibrierte örtliche Anpassung

Kalibrierungskoordinaten

Kartesische Koordinaten

Kartiercodes

Kartographieprojektion

Kinematische Vermessung

Kleine Achse

Kleine Halbachse

Kleinste Quadrate

Komponente

Konstellation

Konventionelle Beobachtung

Koordinatensystem

Korrelation aufheben

Korreliert

Kovarianz

Kovarianzmatrix

Kovarianzwerte

L

L1

L2

Layer

Lösungstypen

Lotabweichung

M

Maßstab

Mehrdeutigkeit

Mehrwegeausbreitung

Merkmals- und Attributbibliotheksdatei (*.fcl)

Minimal bedingt

Mittlerer Fehler der Gewichtseinheit

Mittlerer Fehler

Modellierung

N

Nachverarbeitung

Narrow lane

NAVDATA

Netzausgleichung

Netz

Netzstatus

NMEA

Normale

Normalnull

Normalverteilungskurve

O

Orthometrische Höhe

Örtliche Anpassung

Örtliche geodätische Koordinaten

Örtliches ebenes Koordinatensystem

Örtliches Ellipsoid

OTF-Suchmethode

P

Parameter

Parität

P-Code

PDOP-Grenzwert

PDOP

PDOP-Maske

Phasensprung

Phasenzentrum

Phasenzentrum-Modelle

Polarpunkt

PPM

PRN

Projektdatum

Projekt

Projektion

Projektionswinkel

Punktpositionen

Q

QC-Datensätze

Qualitätsprüfungstest

R

RDOP

Rechtswert

Rechtwinklige Koordinaten

Redundante Basislinie

Redundante Beobachtung

Redundanz

Redundanzzahl

Reduziertes Spaltenprofil

Referenzfaktor

Referenzrahmen

Referenzstation

Referenzvarianz

Relative Fehler

Restwert

RINEX

RMS

Rotation

Rotierter Meridian

Rover

RTCM

RTK

S

Satellitengeometrie

Schleifenschluß

Schrägstrecke

SDMS

Selektive Verfügbarkeit (S/A)

Sigma

Sitzung

Skalargewichtung

Skalar

Sky-Plot

SNR

Standpunktfehler

State Plane-Koordinaten

Statisch (vermessen)

Statisches Netz

Status

Stochastisches Modell

Super-trak

SV

Symbole und Linientypen

Systematische Fehler

T

Tau (Wert)

Tau-Kriterium

TDOP

Teilnetz

Terrestrische Beobachtung

TOW

Transformation

Transformationsgruppe

Transformationsparameter

Troposphärenkorrektur

Troposphären-Modell

U

Überbestimmt

Uhrfehler

Unabhängig

Unbekannt/e

Univariate

URA

Ursprung

US National Survey

US-Vermessungs-Fuß

UTC

V

Varianz

Varianzkomponentengruppe

Varianzkomponentenschätzung

Varianz-Kovarianzmatrix

VDOP

Vektor

Verfolgung

Verhältnis

Vermessungsbeobachtungen

Vertikale Ausgleichung

Vertikaler Festpunkt

Vertikale

Vertrauensgrad

Vollständig bedingt

W

Wahrscheinlicher Wert

Wahrscheinlichkeit

Wave

WGS-84

Wide lane

X

X, Y und Z

Y

Y-Code

Z

Zenit-Verzögerung

Zentrieren

Zweifrequenz


1-Sigma

Ein mittlerer Fehler eines gemittelten Werts.


A Posteriori-Fehler

Die A-Priori-Fehler aus einer Netzausgleichung, multipliziert mit dem mittleren Fehler der Gewichtseinheit (Referenzfaktor).


A Priori-Fehler

Geschätzte Fehler für Beobachtungen vor einer Netzausgleichung.


AASHTO

American Association of State Highway and Transportation Officials.


Genauigkeit

Die Nähe einer Messung am tatsächlichen (wahren) Wert der gemessenen Menge.


Ausgeglichene Werte

Ein Wert, der von beobachteten Daten (Messungen) abgeleitet wird, indem ein Prozeß angewendet wird, der die Fehler in diesen Daten in einer Netzausgleichung eliminiert.


Ausgleichung

Der Vorgang der Bestimmung und Anwendung von Korrekturen auf Beobachtungen zum Zweck der Fehlerreduzierung in einer Netzausgleichung.


Ausgleichungskonvergenz

Wenn die Netzausgleichung die definierte Restwert-Toleranz oder den endgültigen Konvergenzgrenzwert innerhalb einer definierten Anzahl von Iterationen erfüllt hat.


Ausgleichungsdatum

Das in der aktuellen Netzausgleichungsiteration verwendete Datum. Die Trimble Geomatics Office-Software läßt Sie entweder das Projektdatum oder WGS-84 wählen.


Ausgleichungsstile

Trimble-Standardeinstellungen und benutzerdefinierte Einstellungen für eine Netzausgleichung.


Algebraisches Zeichen

Das Zeichen (+ oder −), das mit einem Wert verbunden ist, der diesen als positive oder negative Zahl kennzeichnet.


Algorithmus

Eine Anzahl von Regeln zur Lösung eines Problems in einer begrenzten Anzahl von Schritten.


Almanach

Von einem GPS-Satelliten übermittelte Daten, die Information über die Laufbahn, Uhrzeit-Korrektur und Parameter der atmosphärischen Verzögerung aller verfolgten Satelliten enthalten.

Der Almanach ermöglicht eine schnelle SV-Erfassung. Die Information über die Laufbahn ist ein untergeordneter Satz von Ephemeridendaten mit reduzierter Genauigkeit.


Mehrdeutigkeit

Die unbekannte ganzzahlige Anzahl von Zyklen der rekonstruierten Trägerphasenabweichung, die in einem ununterbrochenen Satz von Messungen enthalten ist. Der Empfänger zählt die Funkwellen (von dem Satelliten, wenn diese an der Antenne ankommen) mit einem hohen Genauigkeitsgrad. Der Empfänger verfügt jedoch über keine Information über die Wellenanzahl zum Satelliten zum Zeitpunkt, als er mit der Zählung begann. Diese unbekannte Anzahl von Wellenlängen zwischen dem Satelliten und der Antenne ist die angesprochene Mehrdeutigkeit, auch bekannt als Ganzzahlige Mehrdeutigkeit.


Anmerkung

Eine Anmerkung ist ein Textstück, das einen anderen Datenbanksatz beschreibt. Um Anmerkungen zu wählen und zu bearbeiten, verwenden Sie das Eigenschaftsfenster.

Anmerkungen sind dynamisch, d. h., wenn sich eine Eigenschaft eines Elements ändert, werden auch die Angaben in der Anmerkung aktualisiert.


Antennenhöhe

Die Höhe des Antennenphasenzentrums einer GPS-Antenne oberhalb des beobachteten Punktes.

Die unkorrigierte Antennenhöhe wird von dem beobachteten Punkt zu einem zuvor festgelegten Punkt auf der Antenne gemessen und dann in der Software manuell oder automatisch auf die tatsächliche Höhe korrigiert.


Antennenphasenkorrektur

Das Phasenzentrum für eine GPS-Antenne ist weder ein physikalischer noch ein fester Punkt. Das Phasenzentrum einer GPS-Antenne ändert sich im Hinblick auf die sich ändernde Signalrichtung von einem Satelliten. Die Änderung des Phasenzentrums hängt hauptsächlich von der Satellitenhöhe ab. Durch die Modellierung dieser Änderung am Antennenphasenzentrum können unterschiedliche Antennentypen bei einer einzelnen Vermessung eingesetzt werden. Antennenphasenkorrekturen sind nicht so kritisch, wenn zwei identische Antennen eingesetzt werden, da sich gemeinsame Fehler aufheben.


Anti-Spoofing (AS)

Eine technische Maßnahme des US Department of Defense (U.S.-Verteidigungsministerium), um anstelle eines P-Codes einen verschlüsselten Y-Code zu übertragen. Y-Code ist nur autorisierten (vornehmlich militärischen) Nutzern zugänglich. Anti-Spoofing (AS) wird in Verbindung mit Selektiver Verfügbarkeit verwendet, um zivilen Nutzern nicht die volle Präzision des GPS-Systems zukommen zu lassen.


APC

Antenna Phase Center

Die elektronische Mitte der Antenne. Sie stimmt häufig nicht mit dem mechanischen Zentrum der Antenne überein. Das Funksignal wird am Antennenphasenzentrum (APC) gemessen.

Im Eigenschaftsfenster kann die Höhe eines Punkts die Höhe der APC sein. Wenn die Höhe als APC angegeben ist, handelt es sich um die Höhe des Antennenphasenzentrums, nicht um die Bodenhöhe.


Autonome Positionierung

Eine Betriebsart, in der der GPS-Empfänger Positionsbestimmungen in Echtzeit ausschließlich aus Satellitendaten berechnet, ohne eine Basisstation als Referenz für differentielle Korrekturen zu verwenden. Die autonome Positionierung ist das ungenaueste Positionierungsverfahren, das ein GPS-Empfänger durchführen kann. Es ergibt Positionsbestimmungen, die bis auf ±100 m horizontale RMS genau sind, wenn die Selektive Verfügbarkeit aktiviert ist, und Positionen bis auf ±10--20 m genau sind, wenn sie nicht aktiviert ist. Auch bekannt als absolute Positionierung und Punktpositionierung.


Azimut

Ein Winkel, der von einer horizontalen Basislinie und dem geodätischen Norden gebildet wird. Wenn dieser Winkel auf GPS-Beobachtungen angewendet wird, bezieht er sich auf einen ellipsoidischen Azimut.


Basisstation

Eine Kombination aus Antenne und Empfänger, die an einer bekannten Position aufgestellt werden. Sie wird bei Echtzeit-kinematischen (RTK) oder differentiellen Vermessungen verwendet. An der Basisstation können Daten für die spätere Nachverarbeitung aufgezeichnet werden. Beispiele für Basisstationen sind eine Trimble-Referenzstation wie die Trimble Reference Station (TRS) Software oder die Trimble Universal Reference Station Software (URS) und ein Empfänger in der Betriebsart Basisstation.

In der GPS-Vermessungspraxis werden Basislinien beobachtet und berechnet (d. h. die Position eines Empfängers relativ zu einem anderen). Die Basisstation fungiert als Position, von der alle anderen unbekannten Positionen abgeleitet werden.


Basislinie

Die Position eines Punktes relativ zu einem anderen Punkt. Bei GPS-Vermessungen ist dies die Position eines Empfängers relativ zu einem anderen Empfänger. Wenn die Daten von diesen beiden Empfängern kombiniert werden, ergibt dies eine Basislinie, die aus einem dreidimensionalen Vektor zwischen den zwei Stationen besteht.


Basislinienverarbeitungsprogramm

Ein Computerprogramm, das Basislinienlösungen aus Satellitenmessungen berechnet. Es kann als Nachverarbeitungsprogramm auf einem PC oder als ein Echtzeit-Verarbeitungsprogramm in einem Empfänger laufen. WAVE (Weighted Ambiguity Vector Estimator) ist Trimbles Programm zur Basislinienverarbeitung.


Baud

Eine Einheit der Datenübertragungsgeschwindigkeit (von einem binären digitalen Gerät zu einem anderen), die zur Beschreibung serieller Kommunikation verwendet wird.


Bivariate

Mathematische Funktion, die das Verhalten von zweidimensionalen Zufallsfehlern in Fehlerellipsen beschreibt für:

  Hochwert/Rechtswert

  Breitengrad/Längengrad

  X/Y


CAD-Stile

CAD-Stile definieren das Erscheinungsbild von Punkten, Linien, Bögen, Kurven, Text und Anmerkungen in einem Projekt. Ein Stil kann zum Beispiel aus einem/r Symbol, Linientyp, Farbe oder Schriftart gebildet werden. Stildefinitionen werden in einem Projekt gespeichert.

Definieren Sie die Stile in einer Projektvorlage, wenn Sie bestimmte Stile für mehrere Projekte verwenden möchten.


Kalibrierte Örtliche Anpassung
Kalibrierte örtliche Anpassung (Örtlichkeit)

Eine Definition der Örtlichkeit verwendet eine bestehende Definition des Koordinatensystems sowie zusätzliche Korrekturtransformationen. Dies ergibt die beste Anpassung für GPS-Daten in einem speziellen Gebiet

Die zusätzlichen Korrekturtransformationen sind notwendig, weil ein Koordinatensystem so definiert ist, daß es auf eine sehr große Fläche (z. B. einen Meridianstreifen) angewendet wird. Es erlaubt keine Abweichungen in den örtlichen Koordinaten.

Es ist notwendig, daß die neue Arbeit mit dem bestehenden Festpunktnetz übereinstimmt, damit die zusätzlichen Korrekturtransformationen auf diese örtlichen Abweichungen angewendet werden können. Diese Zusatzkorrekturen sind nur in einem begrenzten Gebiet gültig. Daher der Begriff “Örtliche Anpassung”.

Es ist notwendig, in einem neuen Meßgebiet eine örtliche Anpassung durchzuführen. Die dabei entstehenden Korrekturparameter sind nur in diesem Meßgebiet gültig. Daher der Begriff „Örtliche Anpassung“.

Die Trimble Geomatics Office-Software kann die zusätzlichen Transformationen berechnen, die für die Anpassung an die örtlichen Festpunkte erforderlich sind, und diese Definitionen in der Koordinatensystem-Datenbank speichern.


Kalibrierungskoordinaten

WGS-84-Koordinaten (Breitengrad/Längengrad/Ellipsoidische Höhe), die von einer minimal bedingten Netzausgleichung Ihrer GPS-Beobachtung erzeugt wurden und dann zur späteren Verwendung bei einer GPS-Kalibrierung gespeichert wurden.

Die Kalibrierungskoordinaten werden bei einer Kalibrierung als GPS-Koordinaten verwendet, die den Gitternetz-Koordinaten des entsprechenden Punktes zugeordnet werden.


Kartesische Koordinaten

Siehe Geozentrische kartesische Koordinaten (ECEF) .


Chi-Quadrat-Test

Ein umfassender statistischer Test der Netzausgleichung. Der Chi-Quadrat-Test ist ein Test der Summe der gewogenen Verbesserungsquadrate der Restwerte, der Anzahl der Freiheitsgrade und einer kritischen Wahrscheinlichkeit von 95 Prozent oder höher.

Der Zweck dieses Tests ist es, die Hypothese, daß die vorausgesagten Fehler genau geschätzt wurden, abzulehnen oder anzunehmen.


Uhrfehler

Der konstante Unterschied in der Zeitablesung zwischen zwei Uhren. Bei GPS bezieht sich der Uhrfehler gewöhnlich auf den Unterschied zwischen Satellitenuhren und der Uhr des vom Benutzer verwendeten Empfängers.


Abschluß

Übereinstimmung zwischen gemessenen und bekannten Teilen eines Netzes.


CMR

Compact Measurement Record

Eine Meldung der Satellitenmessung, die vom Basisempfänger gesendet und von Echtzeit-kinematischen (RTK) Vermessungen verwendet wird, um eine genaue Basislinie von der Basis zum Rover zu berechnen.


Coarse Acquisition (C/A)-Code

(Grober/Erfassungscode) Ein ungeschützter, Pseudo-Random-Number-(PRN)-Signalcode, der auf das L1-Signal eines GPS-Satelliten aufmoduliert ist. Dieser Code hilft dem Empfänger, seinen Abstand vom Satelliten zu berechnen.


Code

Der GPS-Code ist ein Pseudo-Random-Number-(PRN)-Signalcode, der auf die GPS-Trägersignale aufmoduliert ist.

Der C/A-Code ist nicht klassifiziert und ist für zivile Anwendungen verfügbar.

Der P-Code ist ebenfalls bekannt und nicht klassifiziert, kann aus nationalen Verteidigungszwecken jedoch verschlüsselt sein.

Code-Messungen sind die Basis der GPS-Navigation und -Positionierung. Ein Code wird zudem in Verbindung mit Trägerphasenabweichungsmessungen verwendet, um Basislinienlösungen mit höherer Vermessungsqualität zu erzielen.


Komponente

Eine der drei Vermessungsbeobachtungen, die verwendet werden, um eine dreidimensionale Basislinie zwischen zwei Festpunkten zu definieren. Dieselbe Basislinie kann durch Azimut, Delta Höhe und Strecke (Ellipsoid-Koordinaten), durch Delta X, Delta Y und Delta Z (geozentrischen kartesische Koordinaten) und durch Delta Hochwert, Delta Rechtswert und Delta Höhe (örtliche Ebenenkoordinaten) definiert sein.


Konstellation

Eine spezifische Menge von Satelliten, die für die Berechnung von Positionen eingesetzt wird: drei Satelliten für 2D-Positionsbestimmungen, vier Satelliten für 3D-Positionsbestimmungen.

Alle Satelliten, die für einen GPS-Empfänger gleichzeitig sichtbar sind. Die optimale Konstellation ist die Konstellation mit dem niedrigsten PDOP. Siehe auch PDOP.


Bedingt

Eine Menge (Beobachtung und Koordinaten) in einer Netzausgleichung als wahr festhalten.


Bedingung

Externe Beschränkungen, die auf die ausgleichbaren Mengen (Beobachtungen und Koordinaten) in einer Netzausgleichung angewendet wurden.


Festpunkt

Ein festgelegter Punkt, dem Koordinaten durch die Verwendung von Vermessungsbeobachtungen zugeordnet wurden, oder gerade zugeordnet werden.


Konventionalle Beobachtung
Konventionelle Beobachtung

Eine Beobachtung im Gelände, die unter Verwendung einer Totalstation oder eines Theodoliten durchgeführt wurde.


Koordinatensystem

Eine Reihe von Transformationen, die es ermöglichen, GPS-Positionen (im WGS-84-Ellipsoid) zu Projektionskoordinaten mit Höhen über dem Geoid zu transformieren.

Im wesentlichen besteht ein Koordinatensystem aus einer Datum-Transformation, der Zuordnung eines Geoidmodells und der Definition einer Koordinaten-Projektion.

Die Datum-Transformation ist in der Koordinatensystem-Datenbank definiert. Sie beinhaltet die Definition des Datums, auf dem die Koordinaten-Projektion beruht.

Ein bestehendes Geoidmodell kann einem Koordinatensystem zugeordnet sein, aber es ist auch möglich, einen konstanten Geoid-Abstand zu definieren und anstelle eines Geoidmodells zu verwenden. Verwenden Sie das Trimble Coordinate System Manager™-Programm, um Geoidmodelle in der Koordinatensystem-Datenbank zu definieren.

Sie können einem Koordinatensystem verschiedene Typen von Koordinaten-Projektionen zuordnen (zum Beispiel Transversal-Mercator oder Lambert-1-Parallel). Verschiedene Länder und Regionen verwenden unterschiedliche Projektionstypen, um optimale Ergebnisse (d. h. minimale Verzerrung) bei den resultierenden Projektionskoordinaten zu erzielen. Die Methoden der Koordinaten-Projektion übertragen die Breiten- und Längenwerte im entsprechenden Datum auf die kartesischen Koordinatenwerte. Die Höhen für die Projektionskoordinaten werden über das Geoidmodell erzielt, das dem Koordinatensystem zugeordnet ist.

Mit dem Trimble Coordinate System Manager-Programmkönnen Sie die von der Trimble Geomatics Office-Software zu Verfügung gestellten Koordinatensystemdefinitionen anzeigen, bearbeiten und hinzufügen.


Korreliert

Zwei oder mehr Beobachtungen (oder abgeleitete Mengen), die mindestens eine gemeinsame Fehlerquelle aufweisen.


Kovarianz

Ein Maß der Korrelation von Fehlern zwischen zwei Beobachtungen oder abgeleiteten Mengen. Bezieht sich auch auf einen nicht-diagonalen Wert (d. h. keine Varianz) in einer Varianz-Kovarianzmatrix.


Kovarianzmatrix

Eine Matrix, die die Varianz und Kovarianz einer Beobachtung definiert. Die Elemente der Diagonalen sind die Varianz, und alle Elemente zu beiden Seiten der Diagonalen sind die Kovarianz.


Kovarianzwerte

In der Trimble Geomatics Office-Software ist dies die Angabe der fortgepflanzten (berechneten) a-posteriori-Fehler als Azimut, Strecke und Höhe zwischen Festpunktpaaren, die sich aus einer Netzausgleichung ergeben. Der Begriff Kovarianz weist darauf hin, daß diese Berechnung Kovarianzwerte in der Varianz-Kovarianzmatrix von ausgeglichenen Festpunkten miteinbezieht.


Aktuelle Ansicht

Mit Hilfe des Befehls ″Fenster / Neues Fenster″ können Sie mehr als eine Ansicht der Datenbank öffnen. Jede dieser Ansichten kann eine unterschiedliche Einstellung haben. Die aktuelle Ansicht ist die Ansicht, die gerade angeklickt ist. Sie ist an der aktiven Titelleiste zu erkennen.


Phasensprung

Eine Unterbrechung des Signalempfangs vom Satelliten. Ein Phasensprung erfordert die erneute Schätzung von ganzzahligen Mehrdeutigkeitswerten während der Basislinienverarbeitung.


Datenaufzeichnung

Der Aufzeichnungsvorgang von Satellitendaten, die in einer Datei, die im Empfänger, auf einem Datenrekorder, auf dem die Trimble Survey Controller-Software läuft, oder auf einer PC-Karte gespeichert werden.


Datenmeldung

Eine im GPS-Signal enthaltene Meldung, die über die Standorte und den Zustand (die Gesundheit) der Satelliten sowie alle Uhrkorrekturen berichtet. Sie beinhaltet Informationen über den Zustand anderer Satelliten sowie deren ungefähre Position.


Datum

Ein mathematisches Modell der Erde, das einem Geoid oder Teilen eines Geoids entspricht. Es wird durch die Beziehung zwischen einem Ellipsoid und einem Punkt auf der topographischen Oberfläche definiert, der als Ursprung des Datums gilt. Es wird normalerweise Geodätisches Bezugssystem (Datum) genannt.

Geodätische Weltbezugssysteme werden üblicherweise durch die Größe und Form eines Ellipsoids sowie durch die Position seines Mittelpunkts in Beziehung zum Erdmittelpunkt definiert.


Datum-Defekt

Unbekannte Diskrepanz zwischen zwei Koordinatensätzen, die nur mit Hilfe einer Datum-Transformation als Teil einer Netzausgleichung berichtigt werden kann.


Datum-Transformation

Definiert die Transformation, die verwendet wird, um die Koordinaten eines in einem Datum definierten Punktes in Koordinaten eines anderen Datum zu transformieren.

Es gibt eine Reihe unterschiedlicher Datum-Transformationsmethoden, die von der Trimble Geomatics Office-Software unterstützt werden:

  Sieben Parameter

  Drei Parameter (auch Molodensky genannt)

  Datum-Gitternetz

  Mehrfachregression

Datum-Transformationen konvertieren gewöhnlich Daten, die in dem WGS-84-Datum unter Verwendung von GPS-Methoden aufgezeichnet wurden, in Datums, die für Vermessungs- und Projektionszwecke in individuellen Regionen und Ländern verwendet werden.


Korrelation aufheben

Entfernen der Kovarianzen zwischen Beobachtungen. Dies kann durch sorgfältige orthogonale Transformationen oder durch die Berechnung separater horizontaler und vertikaler Ausgleichungen erreicht werden.


Lotabweichung

Der Winkelunterschied zwischen der Aufwärtsrichtung der Lotlinie (Vertikale) und der Senkrechten (Normale) zum Ellipsoid.


Freiheitsgrade

Ein Maß der Redundanz in einem Netz.


Höhenunterschied

Der orthometrische Höhenunterschied zwischen zwei Punkten.


Delta Höhe

Die vertikale Komponente in der Darstellung von GPS-Basislinien in der Trimble Geomatics Office-Software. Sie gibt den Unterschied in der ellipsoidischen Höhe oder die Höhenänderung an.


Delta Hochwert. Delta Rechtswert, Delta Höhe

Koordinatenunterschiede, ausgedrückt in einem örtlichen ebenen Koordinatensystem.


Delta X, Delta Y, Delta Z

Koordinatenunterschiede, ausgedrückt in einem kartesischen Koordinatensystem.


Differentielle Positionierung

Die präzise Messung der relativen Position zweier Empfänger, die gleichzeitig dieselben Satelliten verfolgen.


DOP

Dilution of Precision (Präzisionsminderung der Position)

Eine Kennzahl für die Qualität einer GPS-Position. DOP berücksichtigt die Position jedes Satelliten im Verhältnis zu den anderen Satelliten in der Konstellation sowie ihre Geometrie im Bezug auf die GPS-Empfänger. Ein niedriger DOP-Wert zeigt eine höhere Genauigkeitswahrscheinlichkeit an. Die Standard-DOPs für GPS-Anwendungen sind:

  PDOP Position (drei Koordinaten)

  HDOP Horizontal (zwei horizontale Koordinaten)

  RDOP

  VDOP Vertikal (nur Höhe)

  TDOP Zeit (nur Uhrfehler)


Doppler-Verschiebung

Die offensichtliche Änderung in der Frequenz eines Signals, verursacht durch die relative Bewegung von Satelliten und Empfängern.


Doppelte Differenzbildung

Eine arithmetische Methode zur Differenzbildung von Trägerphasenabweichungen, die von zwei Empfängern gemessen werden, die dieselben Satelliten gleichzeitig verfolgen. Diese Methode beseitigt die Uhrfehler von Satelliten und Empfänger.


DGM

Digital Terrain Model (Digitales Gelände-Modell)

Eine elektronische Darstellung des Geländes in drei Dimensionen.


Zweifrequenz

Ein Empfängertyp, der sowohl L1- als auch L2-Signale von GPS-Satelliten verwendet. Ein Zweifrequenz-Empfänger kann genauere Positionsbestimmungen über längere Strecken und unter schlechteren Bedingungen berechnen, indem er Verzögerungen durch die Ionosphäre mißt und ausgleicht.


Geozentrisches kartesisches Koordinatensystem (ECEF)

Ein geozentrisches kartesisches Koordinatensystem (engl. ECEF Earth-Centered Earth-Fixed), das vom WGS-84-Referenzrahmen verwendet wird. In diesem Koordinatensystem befindet sich der Ursprung des Koordinatensystems im Massenschwerpunkt der Erde. Die z-Achse ist deckungsgleich mit der mittleren Rotationsachse der Erde und die x-Achse verläuft durch 0° N und 0° O. Die y-Achse ist senkrecht zur Ebene der x- und z-Achsen.


Rechtswert

Im rechtwinkligen ebenen Koordinatensystem der Abstand zur X-Achse, gemessen in östlicher Richtung (von links nach rechts.)


Höhe

Die Höhe über Normalnull oder die vertikale Strecke über dem Geoid. Diese Höhe wird auch als orthometrische Höhe bezeichnet.


Höhenmaske

Ein Winkel, der normalerweise auf 13 Grad gesetzt ist. Wenn Sie Satelliten oberhalb dieses Winkels verfolgen, vermeiden Sie Störungen, die durch Gebäude, Bäume sowie durch Fehler infolge von Mehrwegeausbreitung verursacht werden können.

Trimble empfiehlt, keine Satelliten zu verfolgen, deren Höhenmaske unter 13 Grad liegt.


Ellipsoid

Ein mathematisches Modell der Erde, das durch die Rotation einer Ellipse um ihre kleine Achse gebildet wird. Bei Ellipsoiden, die die Erde darstellen, ist die Polachse die kleine Achse und die Äquatorachse die große Achse.

Ein Ellipsoid wird vollständig definiert durch die Angabe der Längen beider Achsen bzw. der Länge der großen Achse und der Abplattung.

Ein Ellipsoid wird durch zwei Größen definiert, die üblicherweise wie folgt gegeben sind:

die Länge der großen Halbachse, a, und

die Abplattung, [image], wobei b die Länge der kleinen Halbachse ist.


Ellipsoid-Strecke

In der Trimble Geomatics Office-Software ist die Ellipsoid-Strecke die Länge des Raumvektors zwischen zwei Punkten.

ACHTUNG: Eine Ellipsoid-Strecke ist nicht dasselbe wie eine geodätische Strecke.


Ellipsoidische Höhe

Die Strecke, die entlang der Normalen von der Oberfläche des Ellipsoids zu einem Punkt gemessen wird.


Elemente

Elemente sind in erster Linie graphische Elemente, die Sie im Graphikfenster anzeigen und auswählen können.

Die in der Trimble Geomatics Office-Software verfügbaren Elemente sind Punkte, Linien, Bögen, Kurven, Text und Anmerkungen.


Ephemeriden

Ein Satz von Daten, der die Position eines Himmelskörpers als eine Funktion der Zeit beschreibt. Jeder GPS-Satellit überträgt periodisch eine vom Kontrollsegment hochgeladene Broadcast-Ephemeriden, in der der Satellit seine vorhergesagten Positionen für die nahe Zukunft beschreibt. Nachverarbeitungsprogramme können auch Genaue Ephemeriden verwenden, die die exakte Position eines Satelliten zu bestimmten Zeitpunkten in der Vergangenheit angeben.


Epoche

Das Meßintervall eines GPS-Empfängers. Die Epoche ist je nach Vermessungstyp unterschiedlich:

  für Echtzeit-Vermessungen ist sie auf eine Sekunde eingestellt

  für nachverarbeitete Vermessungen kann sie auf einen Wert zwischen einer Sekunde und einer Minute eingestellt werden.


Epochenintervall

Das Meßintervall, das von einem GPS-Empfänger verwendet wird, auch Zyklus genannt.


Fehler

Der Unterschied zwischen dem gemessenen Wert einer Menge und seinem wahren Wert. Vermessungsfehler werden im allgemeinen in drei Kategorien unterteilt: grobe Fehler, systematische Fehler und Zufallsfehler. Die Kleinste-Quadrate-Analyse wird eingesetzt, um grobe und systematische Fehler zu ermitteln und zu beseitigen, und eine Ausgleichung nach der Methode der kleinsten Quadrate  wird verwendet, um Zufallsfehler zu messen und ordnungsgemäß zu verteilen.


Fehlerellipse

Eine Koordinaten-Fehlerellipse ist eine graphische Darstellung der Größe und Richtung des Fehlers von ausgeglichenen Punkten.


Ereignisse

Eine Aufzeichnung eines Ereigniszeitpunktes, wie z. B. das Schließen eines photogrammetrischen Kameraverschlusses. Ein GPS-Empfänger kann eine Ereignismarkierung aufzeichnen, die die Zeit des Ereignisses und eine alphanumerische Bemerkung enthält, die über das Tastaturfeld zur Beschreibung des Ereignisses eingegeben wurde. Ein Ereignis kann über das Tastaturfeld oder durch eine elektrische Signaleingabe an einer der Empfängerschnittstellen ausgelöst werden.


FastStatic

Eine GPS-Vermessungsmethode, die Besetzungen von bis zu 20 Minuten verwendet, um GPS-Rohdaten aufzuzeichnen und danach nachverarbeitet, um Genauigkeiten im Millimeterbereich zu erzielen. Die Besetzungszeiten sind in der Regel unterschiedlich, basierend auf der Anzahl der sichtbaren Satelliten (SVs):

  20 Minuten für 4 SVs *

  15 Minuten für 5 SVs *

  8 Minuten für 6 oder mehr SVs *

(*aufgezeichnet mit einer Epochenrate von 15 Sekunden)


Merkmals- und Attributbibliotheksdatei (*.fcl)

Eine Text-Datei, die die Definitionen von Kartiercodes, Attributen, CAD-Stilen und Steuercodes enthält.


Kartiercodes

Erläuternde Worte oder Abkürzungen, die die Merkmale beschreiben, die Sie sehen.


Feldcodes

Feldcodes sind spezielle Anweisungen, die die Trimble Geomatics Office-Software anweisen, Informationen in Berichte, Dateien und Anmerkungen einzufügen.

Feldcodes werden zur Übertragung von Datenbank-Daten bei ASCII-Import-/Export-/Bericht-Vorgängen verwendet.


Endgültige Lösung

Wenn GPS-Basislinien durch Nachverarbeitung erzeugt werden (vor allem für statische Lösungen) durchläuft das Basislinienverarbeitungsprogramm unterschiedliche Lösungen unter Verwendung einer Reihe von Verarbeitungsmethoden und Kombinationen von GPS-Messungen. Im allgemeinen ist jede nachfolgende Lösung besser als die vorhergehende. Die endgültige Lösung bietet die beste Abschätzung der GPS-Basislinie zwischen zwei Punkten.


Festgehaltene Koordinaten
Fest

Siehe Bedingt.


Festgehaltene Koordinaten

Punktkoordinaten, die nicht bewegt werden, wenn eine Netzausgleichung durchgeführt wird. Auch als Zwangspunktkoordinaten bezeichnet.


Fixed-Lösung

Eine Lösung, die ermittelt wird, wenn die Basislinienverarbeitung die ganzzahlige Mehrdeutigkeitssuche mit ausreichender Zuverlässigkeit lösen kann, um einen Satz von Ganzzahlen einem anderen Satz vorzuziehen. Sie wird Fixed-Lösung genannt, da alle Mehrdeutigkeiten von ihren geschätzten Float-Werten zu ihren korrekten Ganzzahlwerten festgelegt sind.


Abplattung

Ein mathematischer Ausdruck der relativen Längen der großen und kleinen Achsen eines Ellipsoids.


Abplattung Richtungswinkel/Strecke

Ein Ausdruck der Abplattung, der einfacher abzulesen und zu bearbeiten ist.


Float-Lösung

Eine Lösung, die ermittelt wird, wenn die Basislinienverarbeitung die ganzzahlige Mehrdeutigkeitssuche nicht mit ausreichender Zuverlässigkeit durchführen kann, um einen Satz Ganzzahlen einem anderen Satz vorzuziehen. Sie wird Float-Lösung genannt, da die Mehrdeutigkeit eine Stelle hinter dem Komma einschließt und keine Ganzzahl ist.


Freie Ausgleichung

Eine Netzausgleichung, in der es keinen bedingten Punkt (Koordinate) gibt. Die Netzausgleichung verwendet innere Bedingungen.


Häufigkeitsverteilung

Die Größe und Ausbreitung von Restwerten in einem Datensatz. Wird graphisch in Histogrammen dargestellt.


Vollständig bedingt

Eine Netzausgleichung, in der alle Punkte im Netz, die Teil eines größeren Festpunktnetzes sind, ihre Zuordnung zu ihren angegebenen Koordinatenwerten beibehalten. Eine vollständig bedingte Ausgleichung wird verwendet, um kleinere mit größeren und alte mit neuen Festpunktnetzen zu kombinieren. Eine vollständig bedingte Ausgleichung wird auch als vollständig erzwungene Ausgleichung bezeichnet.


GDOP

Geometric Dilution of Precision

Die Relation zwischen Fehlern der Benutzerposition und Zeit und Fehlern in Satellitenentfernungen. Siehe auch DOP.


Geodätischer Azimut

Der Winkel zwischen dem geodätischen Meridian und der Tangente zur geodätischen Linie des Beobachters, gemessen in der Ebene senkrecht zur Nomalen des Ellipsoids des Beobachters. Im Uhrzeigersinn von Norden.


Geodätisches Datum

Ein mathematisches Modell, das sich am besten dem Geoid annähert. Es ist durch die Beziehung zwischen einem Ellipsoid und einem Punkt auf der topographischen Oberfläche der Erde, welcher als Datumspunkt festgelegt wurde, sowie der Größe und Form des Ellipsoids und der Lage des Ellipsoidmittelpunkts relativ zum Massenschwerpunkt der Erde, definiert.

Geodätische Bezugssysteme (Datums) werden definiert durch die Größe und Form eines Ellipsoids und die Position des Ellipsoid-Mittelpunkts in Bezug auf den Mittelpunkt der Erde.

Verschiedene geodätische Bezugssysteme wurden für unterschiedliche Gebiete eingerichtet. Europäische Karten basieren z. B. häufig auf dem europäischen Bezugssystem (Datum) von 1950 (ED-50). Karten der USA basieren oft auf dem North American Datum von 1927 oder 1983 (NAD-27 oder NAD-83). Alle GPS-Koordinaten basieren auf der Oberfläche des WGS-84-Datums.


Geographische Koordinaten

Breitengrad, Längengrad und ellipsoidische Höhe.


Geoid

Eine Fläche gleichen Schwerpunktpotentials, die sich sehr genau der Meereshöhe annähert. Das Geoid hat keine einheitliche mathematische Form, sondern eine unregelmäßige Form, die mit einem Ellipsoid vergleichbar ist.

Die Höhen der Punkte werden im allgemeinen im Bezug auf das Geoid gemessen. Aber Punkte, die durch GPS-Methoden festgelegt wurden, haben Höhen, die im WGS-84-Datum (einer mathematischen Figur) ermittelt werden.

Die Beziehung zwischen dem WGS-84-Datum und dem Geoid muß durch Beobachtung ermittelt werden, da es keine mathematische Definition gibt, die diese Beziehung beschreiben kann. Sie müssen konventionelle Vermessungsmethoden verwenden, um die Höhe über dem Geoid zu beobachten; vergleichen Sie dann die Ergebnisse mit der Höhe über dem WGS-84-Ellipsoid am selben Punkt.

Durch die Aufzeichnung einer großen Anzahl von Beobachtungen des Abstands von Geoid und WGS-84-Datum (Geoid-Abstand) können Gitter-Dateien der Abstandswerte zusammengestellt werden. Dies ermöglicht die Interpolation des Geoid-Abstands an Zwischenpositionen. Dateien, die diese Gitter aus Geoid-Abständen enthalten, werden als Geoidmodelle bezeichnet. Wenn eine WGS-84-Position innerhalb der Grenzen eines Geoidmodells liegt, kann der Geoid-Abstand an dieser Position aus dem Modell interpoliert werden.


Geoidmodell

Eine mathematische Darstellung des Geoids für ein bestimmtes Gebiet oder die gesamte Erde. Die Software verwendet das Geoidmodell, um Geoid-Abstände für Ihre Punkte im Netz zu erzeugen.


Geoid-Beobachtung

Ein aus einem Geoidmodell entnommener Geoid-Abstand mit seinem zugeordneten Fehler. Die Netzausgleichung der Trimble Geomatics Office-Software behandelt diese Fehler in derselben Weise wie jede andere Beobachtung mit einem zugeordneten Fehler. Im Verlauf der Ausgleichung werden die Beobachtungen zu ausgeglichenen Geoid-Beobachtungen.


Geoid-Abstand

Die Strecke zwischen dem Ellipsoid und dem Geoid an einem vorgegebenen Punkt.


Geomatics

Der Entwurf, die Aufzeichnung, Speicherung, Analyse, Anzeige und das Zurückladen räumlicher Informationen. Die räumlichen Informationen können aus einer Reihe von Quellen stammen, einschließlich GPS und terrestrischen Methoden. Geomatics integriert traditionelle Vermessung mit neuen, technologisch motivierten Lösungsmöglichkeiten, wodurch Geomatics für eine große Anzahl von Anwendungen von Nutzen ist.


GPS

Global Positioning System

GPS beruht auf einer Konstellation von vierundzwanzig (24) Satelliten, die die Erde in sehr großer Höhe umkreisen.


GPS-Basislinie

Eine dreidimensionale Messung zwischen zwei Standpunkten, auf denen  simultan GPS-Daten aufgezeichnet und mit unterschiedlichen Differenzbildungsmethoden verarbeitet wurden.

Wiedergegeben als Delta X, Delta Y und Delta Z; oder Azimut, Strecke und Delta Höhe.


GPS-Beobachtungen

Eine GPS-Basislinie mit ihren zugeordneten Fehlern. Im Verlauf der Ausgleichung werden die Beobachtungen zu ausgeglichenen GPS-Beobachtungen.


GPS-Rohdaten

Die Daten, die von einem GPS-Empfänger für die Verarbeitung zu einem späteren Zeitpunkt aufgezeichnet wurden. Sie können in Form einer .dat-Datei (Trimbles Rohdaten-Dateiformat) oder einer RINEX-Datei vorliegen.


GPS-Zeit

Ein Zeitmaß, das vom NAVSTAR GPS-System verwendet wird. Die GPS-Zeit basiert auf Universal Time Coordinated (UTC), fügt jedoch keine periodischen ‘Schaltsekunden’ hinzu, um Änderungen in der Dauer der Erdumdrehung zu korrigieren.


Gitternetz

Ein zweidimensionales, horizontales, rechtwinkliges Koordinatensystem, wie zum Beispiel eine Kartenprojektion.


Gitternetzumwandlung

Die Umwandlung zwischen geographischen Koordinaten und Kartenprojektionskoordinaten.


Gitterstrecke

Die Strecke zwischen zwei Punkten, ausgedrückt in Kartographie-Projektionskoordinaten.


Bodenstrecke

Die Strecke (horizontale Strecke mit angewandter Krümmung) zwischen zwei Bodenpunkten.


HDOP

Horizontal Dilution of Precision (Horizontale Präzisionsminderung der Position)


Höhenmeßstab

Ein Meßwerkzeug, das mit externen GPS-Antennen geliefert und für die Messung der Antennenhöhe über einem Punkt eingesetzt wird.


IH (auch HI)

Instrumentenhöhe

Synonym mit Antennenhöhen für GPS.


Histogramm

Eine graphische Darstellung der Größe und Verteilung von Restwerten in einer Netzausgleichung.


Horizontaler Festpunkt

Ein Punkt mit einer nur horizontalen Koordinatengenauigkeit. Die orthometrische oder ellipsoidische Höhe hat eine geringere Genauigkeit oder ist unbekannt.


Horizontale Strecke

Die Strecke zwischen zwei Punkten, horizontal von der Höhe jedes Punktes berechnet.


Horizontale Position

Ein Punkt mit nur horizontalen Koordinaten.


Unabhängig

Teilnetze, Beobachtungen und Festpunkte, die nicht durch Geometrie oder Fehler verbunden sind. Dieser Begriff ist das Gegenteil von Korreliert.


Innere Bedingung

Eine Netzausgleichung, bei der keine Punktkoordinaten festgehalten, sondern innere Bedingungen verwendet werden; auch als freie Netzausgleichung bezeichnet. Die Trimble Geomatics Office-Software verwendet den Schwerpunkt des Netzes als innere Bedingung. Eine innere Bedingung wird auch als innerer Zwang bezeichnet.


Ganzzahlige Mehrdeutigkeit

Die gesamte Anzahl von Zyklen in einer Trägerphasen-Pseudoentfernung zwischen dem GPS-Satelliten und dem GPS-Empfänger.


Ganzzahlsuche

Bei der GPS-Basislinienverarbeitung, sowohl bei der Verarbeitung von Echtzeit- und nachverarbeiteten Daten, sind ganzzahlige Fixed-Lösungen für bestmögliche Resultate erforderlich. Die Software, die die für die Ableitung einer Basislinie verwendeten GPS-Messungen verarbeitet, führt eine Ganzzahlsuche durch, um eine Fixed-Lösung zu erhalten. Die Suche beinhaltet das Ausprobieren verschiedener Kombinationen von Ganzzahlwerten und die Auswahl der besten Ergebnisse.


Iono-frei

Ionosphären-freie Lösung

Eine Lösung, die eine Kombination von GPS-Messungen verwendet, um die Auswirkungen der Ionosphäre auf die GPS-Signale zu modellieren und zu entfernen. Diese Lösung wird oft für hochrangige Kontrollvermessungen verwendet, besonders wenn lange Basislinien beobachtet werden.


Ionosphäre

Eine Schicht aufgeladener Teilchen, die sich ca. 100 bis 200 km oberhalb der Erdoberfläche befindet. Die Ionosphäre beeinflußt die Genauigkeit von GPS-Messungen, wenn Sie lange Basislinien unter Verwendung von Einfrequenz-Empfängern messen.


Ionosphärenmodellierung

Die von der Ionosphäre verursachte Zeitverzögerung variiert hinsichtlich der Frequenz der GPS-Signale und beeinflußt sowohl die L1- als auch die L2-Signale auf unterschiedliche Weise. Wenn Zweifrequenz-Empfänger verwendet werden, können die Trägerphasen-Beobachtungen für beide Frequenzen verwendet werden, um den größten Teil der ionosphärischen Auswirkungen zu modellieren und zu eliminieren. Wenn keine Zweifrequenz-Messungen verfügbar sind, kann ein von den GPS-Satelliten übertragenes Ionosphärenmodell verwendet werden, um ionosphärische Auswirkungen zu reduzieren. Die Verwendung des Broadcast-Modells ist jedoch nicht so wirkungsvoll wie die Verwendung von Zweifrequenz-Messungen.


Iteration

Ein vollständiger Satz von Ausgleichungsberechnungen, die die Formulierung der Beobachtungsgleichungen, normaler Gleichungen, Koordinatenausgleichungen und die Berechnung von Restwerten beinhaltet.


Kinematische Vermessung

Eine GPS-Vermessungsmethode, die kurze Stop & Go-Besetzungen einsetzt, während  mindestens 4 Satelliten vom Empfänger verfolgt werden. Eine kinematische Vermessung kann in Echtzeit durchgeführt oder nachverarbeitet werden, um Genauigkeiten im Zentimeterbereich zu erhalten.


Initialisierung über bekanntem Punkt

Eine Initialisierung über einem bekanntem Punkt wird in Verbindung mit einer kinematischen Initialisierung eingesetzt. Wenn zwei bekannte Punkte verfügbar sind, kann das Basislinienverarbeitungsprogramm Richtungswinkel/Strecke zwischen den beiden Punkten berechnen und eine Initialisierungsbasislinie ableiten. Diese Initialisierungsbasislinie, mit bekannten Basislinienkomponenten, wird verwendet, um bei der Lösung der ganzzahligen Mehrdeutigkeit zu helfen. Wenn das Basislinienverarbeitungsprogramm diese Mehrdeutigkeit erfolgreich lösen kann, ist eine Fixed-Lösung möglich. Fixed-Lösungen sind die bestmöglichen Lösungen für kinematische Vermessungen.


L1

Die primäre L-Band-Trägerfrequenz, die von GPS-Satelliten verwendet wird, um Satellitendaten zu übertragen. Die Frequenz ist 1575,42 MHz. Auf diese Frequenz werden der C/A-Code, der P-Code und eine Navigationsmeldung aufmoduliert.


L2

Die sekundäre L-Band-Trägerfrequenz, die von GPS-Satelliten verwendet wird, um Satellitendaten zu übertragen. Die Frequenz ist 1227,6 MHz. Auf diese Frequenz werden der P-Code und eine Navigationsmeldung aufmoduliert.


Beschriftung

Informationen, die Sie Punkten im Projekt zuordnen können. Sie erscheinen neben Punkten und helfen Ihnen, Punkte leichter zu finden. Beschriftungen sind in Vermessungsansicht und Planansicht sichtbar.

Sie können die vordefinierte Beschriftungsdefinition der Trimble Geomatics Office-Software verwenden, um Punkte zu beschriften (zum Beispiel mit ihren Namen, Kartiercodes und Höhen).

Beschriftungen verwenden dieselbe Schriftart und Größe wie die QuickInfo in Ihren Anzeigeeinstellungen in Microsoft Windows.

Um Punkten in der Datenbank Beschriftungen zuzuordnen, verwenden Sie Ansicht / Punktbeschriftungen.


Layer

Eine Menge, in der Daten gespeichert werden, die zusammen gruppiert wurden.

Die Anordnung von Daten in Layern erleichtert die Datenverwaltung. Ein Projekt kann beliebig viele Layer enthalten. Verwenden Sie das Eigenschaftsfenster, um einem Layer ein Element zuzuordnen oder neu zuzuordnen. Ein Layer-Name kann nicht mehr als 100 alphanumerische Zeichen enthalten.


Kleinste Quadrate

Eine mathematische Methode für die Ausgleichung von Beobachtungen, basierend auf der Wahrscheinlichkeitstheorie. In dieser Ausgleichungsmethode wird die Summe der gewogenen Verbesserungsquadrate der Restwerte minimiert.


Vertrauensgrad

Ein Maß der Zuverlässigkeit der Resultate, ausgedrückt in Prozent oder Sigma.


Bedeutungsgrad

Ein Ausdruck der Wahrscheinlichkeit. Ein 1-Sigma (mittlerer) Fehler soll einen Bedeutungsgrad von 68 Prozent haben. Für eindimensionale Fehler wird ein Bedeutungsgrad von 95 Prozent durch 1,96 Sigma ausgedrückt, und ein prozentualer Bedeutungsgrad wird durch 2,576 Sigma ausgedrückt.


Örtliches Ellipsoid

Das von einem Koordinatensystem spezifiziertes Ellipsoid. Die WGS-84-Koordinaten werden zuerst auf dieses Ellipsoid transformiert und dann in Gitternetz-Koordinaten konvertiert.


Örtliche geodätische Koordinaten

Der Breitengrad, Längengrad und die Höhe eines Punktes. Die Koordinaten werden in bezug auf das örtliche Ellipsoid angegeben.


Örtliches ebenes Koordinatensystem

Eine Ebene - an jedem beliebigen Punkt - auf der ellipsoidischen Höhe eines gegebenen Punktes, die parallel zur Tangentenebene des Ellipsoids an diesem Punkt ist. Die Koordinatenwerte für das örtliche ebene Koordinatensystem (Local Geodetic Horizon oder LGH) werden als Delta Hochwert, Rechtswert und Höhe angegeben. Der LGH wird für die Rotation von geozentrischen kartesischen Koordinatenunterschieden verwendet, bevor eine Basislinie auf dem Ellipsoid modelliert wird. Azimutwerte, die aus LGH-Komponenten berechnet wurden, müssen bei der Modellierung auf das Ellipsoid auf Differenzen zwischen der Normalen korrigiert werden.


Schleifenschluß

Schleifenschlüsse bieten eine Vorstellung über die Größe der Fehler die in den Beobachtungen in einem Netz enthalten sind.

Ein Schleifenschluß wird berechnet, indem ein Punkt gewählt wird, von dem aus eine oder mehrere Beobachtungen vorgenommen wurden, wobei eine dieser Beobachtungen zu den Koordinaten dieses Punktes hinzugefügt wird und Koordinaten des zweiten Punktes basierend auf dieser Beobachtung berechnet werden. Dieser Vorgang wird einmal oder mehrmals in einer Schleife wiederholt und endet schließlich an dem ursprünglichen Startpunkt. Falls sich in den Beobachtungen kein Fehler befinden würde, wäre die zum Schluß berechnete Koordinate genau dieselbe wie die ursprüngliche Startkoordinate. Ein Abschlußfehler wird bestimmt, indem die berechnete Koordinate von der ursprünglichen Koordinate subtrahiert wird. Die Division dieses Fehlers durch die Länge der Linie ermöglicht die Ausgabe des Fehlers in Teilen pro Million.

Diese Methode kann auch zwischen zwei verschiedenen Punkten eingesetzt werden, wenn beide Punkte mit einem hohen Genauigkeitsgrad bekannt sind. Dies wird auch als Polygonzug-Abschluß bezeichnet.


Große Achse

Siehe Ellipsoid.


Projektionswinkel

Der Winkel zwischen dem Gitter-Norden auf einer Kartenprojektion und dem Längengrad-Meridian an einem gegebenen Punkt. Auch als Konvergenz bekannt.


Kartographieprojektion

Ein genauer mathematischer Ausdruck der gekrümmten Oberfläche des Ellipsoids auf einem rechtwinkligen Koordinatengitter.


Normalnull

Die Durchschnittshöhe der Meeresoberfläche für alle Gezeitenphasen. Wird als Referenz für Höhen verwendet.


Minimal bedingt

Eine Netzausgleichung, in der nur genug Bedingungen eingesetzt werden, um das Koordinatensystem zu definieren. Eine minimal bedingte Netzausgleichung wird verwendet, um die interne Übereinstimmung in Beobachtungen zu messen. Eine minimal bedingte Netzausgleichung wird auch als minimal erzwungene Netzausgleichung bezeichnet.


Kleine Achse

Siehe Ellipsoid.


Modellierung

Mathematischer und geometrischer Ausdruck einer Beobachtung und der damit verbundenen Fehler in einem definierten Koordinatensystem, wie zum Beispiel ein Ellipsoid.


Mehrwegeausbreitung

Eine Störung (vergleichbar mit ″Geisterbildern″ auf dem Fernsehbildschirm), die auftritt, wenn GPS-Signale, die an einer Antenne ankommen, verschiedenen Pfaden gefolgt sind. Für das Signal, das einen längeren Weg zurückgelegt hat, wird eine größere Pseudoentfernung geschätzt und der Fehler vergrößert. Mehrwegeausbreitung kann entstehen, indem das GPS-Signal von Strukturen reflektiert wird, die sich in der Nähe der Antenne befinden.


Narrow lane

Eine lineare Kombination von L1- und L2-Trägerphasen-Beobachtungen (L1 + L2), die für die Aufhebung von ionosphärischen Auswirkungen auf aufgezeichnete Basisliniendaten von Nutzen ist. Die effektive Wellenlänge von Narrow lane ist 10,7 cm.


NAVDATA

NAVDATA ist die 1500-Bit-Navigationsmeldung, die von jedem Satelliten gesendet wird. Diese Meldung enthält die Systemzeit, Uhrkorrekturparameter, Parameter für das Ionosphärenverzögerungsmodell und Details über die Ephemeriden und die Gesundheit des Satelliten. Die Informationen werden verwendet, um GPS-Signale zu verarbeiten und dadurch die Benutzerposition und die Geschwindigkeit zu bestimmen.


Netz

Ein Satz Basislinien. Siehe auch Teilnetz.


Netzausgleichung

Die Lösung simultaner Gleichungen, ausgelegt, um einen Abschluß in einem Vermessungsnetz nach der Methode der kleinsten Quadrate zu erzielen.Die Ausgleichungsmethode, die von der Trimble Geomatics Office-Software eingesetzt wird, wird manchmal auch als Koordinatenvariation und Methode indirekter Beobachtungen bezeichnet.


Netzstatus

Ein Hinweis darauf, daß eine bestimmte Beobachtung in die Ausgleichung eingeschlossen ist.

 Netz bedeutet, daß diese Beobachtung in der Ausgleichung eingeschlossen ist

 Nicht-Netz bedeutet, daß diese Beobachtung von der Ausgleichung ausgeschlossen ist


NMEA

National Marine Electronics Association

Der Standard NMEA 0183 definiert die Schnittstelle für elektronische Marine-Navigationsgeräte. Dieser Standard definiert eine Zahl von 'Strings', NMEA-Strings genannt, die Navigationsdetails wie Positionen enthalten.

Die meisten Trimble GPS-Empfänger können Positionen als NMEA-Strings ausgeben.


Normale

In der Geodäsie die gerade Linie senkrecht zur Oberfläche des Ellipsoids.


Normalverteilungskurve

Eine graphische Darstellung der theoretischen Verteilung von Zufallsvariablen um einen erwarteten Wert gemäß der Wahrscheinlichkeitstheorie. Die Normalverteilungskurve wird in Histogrammen verwendet.


Ellipsoidischer Azimut

Der Winkel, der vom geodätischen Meridian des Beobachters zum beobachteten Punkt auf dem Ellipsoid gemessen wird.


Hochwert

Ein Gitterwert, der in nördlicher Richtung abgelesen wird.


Beobachtungsrestwert

Die auf eine Beobachtung angewendete Korrektur, die bei der Ausgleichung bestimmt wurde.


Beobachtungen

Siehe Vermessungsbeobachtungen.


Besetzungszeit

Der Zeitraum, über den eine Station oder ein Punkt beobachtet werden muß, damit bei der GPS-Basislinienverarbeitung eine GPS-Basislinie berechnet werden kann. Dieser Zeitraum ist unterschiedlich - abhängig von der Vermessungsmethode, dem eingesetzten GPS-Empfängertyp und der für die endgültigen Ergebnisse erforderlichen Präzision. Besetzungszeiten von einigen Sekunden (kinematische Vermessungen) bis zu mehreren Stunden sind möglich (bei Kontroll- oder Deformationsvermessungen, die die höchsten Genauigkeits- und Wiederholbarkeitsstufen erfordern).


Ursprung

Der Schnittpunkt von Achsen in einem Koordinatensystem. Der Ursprungspunkt.


Orthometrische Höhe

Die Strecke zwischen einem Punkt und der Oberfläche des Geoids. Sie wird gewöhnlich als Höhe bezeichnet.


OTF-Suchmethode

Die GPS-Basislinienverarbeitung, ob Echtzeit oder nachverarbeitet, erfordert Fixed-Lösungen für die bestmöglichen Resultate. (Siehe Ganzzahlsuche.)

In der Vergangenheit wurde diese Suche unter Verwendung von Messungen durchgeführt, die aufgezeichnet wurden, während sich zwei oder mehrere Empfänger stationär an ihren entsprechenden Punkten befanden. Moderne Empfänger und Software können die Messungen verwenden, die aufgezeichnet wurden, während der Rover-Empfänger bewegt wurde. Da der Empfänger bewegt wird, werden die Daten ‘On-the-fly‘ (OTF) aufgezeichnet. Die Ganzzahlsuche, bei der diese Daten verwendet werden, wird als ‘OTF-Suche‘ bezeichnet.


Ausreißer

Eine Beobachtung, die von der statistischen Analyse als Beobachtung mit einem Restwert identifiziert wird, der für ihren geschätzten Fehler zu groß ist. Der Begriff ist von der graphischen Position einer Beobachtung in einem Histogramm abgeleitet.


Überbestimmt

Ein Netz, für das mehr Messungen durchgeführt wurden als erforderlich sind, um die Koordinaten des Netzes zu berechnen. Mit Redundanz verwandt.


P-Code

Der ‘präzise’ Code, der von den GPS-Satelliten übertragen wird. Jeder Satellit besitzt einen eindeutigen Code, der auf L1- und L2- Trägerphasenwellen aufmoduliert ist. Der P-Code wird durch einen verschlüsselten Y-Code ersetzt, wenn Anti-Spoofing aktiviert ist.


Parameter

Eine unbekannte Variable, mit deren Hilfe die Koordinaten von Punkten auf einer Linie oder Oberfläche vorgegeben werden. Siehe Unbekannte.


Parität

Eine Form der Fehlerüberprüfung, die bei binärer digitaler Datenspeicherung und -übertragung verwendet wird. Optionen der Paritätsprüfung sind Gerade, Ungerade und Keine.


PDOP

Position Dilution of Precision

Ein Wert ohne Einheiten, der die Beziehung zwischen dem Fehler der Position des Anwenders und dem Fehler der Position des Satelliten angibt. Geometrisch gesehen ist PDOP proportional zu 1, geteilt durch das Volumen der Pyramide, die aus den Linien gebildet wird, die vom Empfänger aus zu vier beobachteten Satelliten laufen. Werte, die für die Positionierung als “gut” erachtet werden, sind klein, wie z. B. 3. Werte größer als 7 sind schlecht. Folglich entspricht ein kleiner PDOP-Wert Satelliten, die weit voneinander entfernt sind.

PDOP steht in Beziehung zur horizontalen und vertikalen DOP durch:


PDOP-Grenzwert

Ein Empfängerparameter, der einen maximalen PDOP-Wert für die Positionierung spezifiziert. Wenn die geometrische Anordnung der Satelliten einen PDOP ergibt, der größer als dieser Maskenwert ist, beendet der Empfänger die Berechnung von Positionsbestimmungen.


PDOP-Maske

Der höchste PDOP-Wert, für den der Empfänger Positionen berechnet.


Phasenzentrum

Siehe Antennenphasenkorrektur.


Phasenzentrum-Modelle

Ein Modell, das verwendet wird, um eine Korrektur basierend auf einem spezifischen Antennentyp auf ein GPS-Signal anzuwenden. Die Korrektur basiert auf der Höhe des Satelliten über dem Horizont und modelliert elektrische Schwankungen im Antennenphasenzentrum. Diese Modelle sind nützlich für die Beseitigung von Fehlern, die eingeführt werden, wenn keine identischen Antennen an den Basis- und Rover-Punkten eingesetzt werden. Siehe auch Antennenphasenkorrektur.


Zentrieren

Die Durchführung der Ausrichtung der Antenne oder des Instruments entlang einer vertikalen Linie (Lotlinie) senkrecht zu der äquipotentialen Oberfläche des Schwerkraftfeldes der Erde.


Punktpositionen

Siehe Autonome Positionierung.


Nachverarbeitung

Verarbeiten von Satellitendaten auf einem Computer, nachdem die Daten aufgezeichnet wurden.


PPM

Parts per Million (Teile pro Million)

Eine standardisierte Wiedergabe eines Maßstabsfehlers in Streckenmessungen. Ein Fehler von 1 ppm würde einen Meßfehler von 1 Millimeter pro 1000 Meter zurückgelegter Strecke ergeben.


Genaue Ephemeriden

Siehe Ephemeriden.


Präzision

Ein Maß dafür, wie eng sich zufällige Größen um einen berechneten Wert herum anordnen. Eine hohe Präzision weist auf kleine Restwerte hin. Wird gewöhnlich in Teilen pro Million (ppm) angegeben.


PRN

Pseudo-Random Number

Eine Folge digitaler Einsen und Nullen, die zufällig verteilt zu sein scheinen, aber genau wiederholt werden kann. PRN-Codes haben einen niedrigen Autokorrelationswert für alle Verzögerungen, es sei denn, sie sind genau übereinstimmend.

Jeder NAVSTAR-Satellit kann anhand seiner eindeutigen PRN in C/A- und P-Code identifiziert werden. Der Ausdruck PRN wird manchmal auch als eine andere Bezeichnung für GPS-Satelliten oder SV verwendet.


Wahrscheinlichkeit

Ein statistischer Prozentsatz, der ausdrückt, welcher Anteil einer hypothetischen Anzahl von Beobachtungen in die definierten Begrenzungen fallen wird. Wird manchmal auch als Bedeutungsgrad bezeichnet.


Wahrscheinlicher Wert

Der ausgeglichene Wert für Beobachtungen und andere Mengen, wobei davon ausgegangen wird, daß die Ausgleichung korrekt durchgeführt wurde. Die genaueste Annäherung an den wahren Wert, die möglich ist.


Projekt

Die Trimble Geomatics Office-Software bearbeitet Daten innerhalb von Projekten. Sie können ein Projekt als einen Arbeitsbereich auffassen, in dem Sie arbeiten. Neue Projekte werden grundsätzlich aus bestehenden Vorlagen erzeugt und übernehmen alle Elemente der Vorlage. Danach wird jede neue Arbeit nur im neuen Projekt gespeichert.

Ein Projekt enthält alle Rohbeobachtungen, berechneten Punkte, die Definition des Koordinatensystems, Linien, Text und CAD-Stile.


Projektdatum

Das Datum, das mit einem Projekt in der Trimble Geomatics Office-Software verbunden ist. Alle örtlichen Koordinaten werden unter Verwendung des Projektdatums angezeigt.


Projektion

Wird verwendet, um ebene Karten zu erzeugen, die die Erdoberfläche oder Teile dieser Oberfläche wiedergeben.


Fortgepflanzter Fehler

Berechnete Fehler, abgeleitet von geschätzten Beobachtungsfehlern und ausgedrückt in bezug auf Koordinatenpositionen. Fortgepflanzte Koordinatenfehler können möglicherweise in relative Fehler in Azimut, Strecke und Deltahöhe zwischen den Punkten fortgepflanzt werden.


Qualitätsprüfungstest

Einer oder mehrere Software-Auswertungstests, die an GPS-Rohdaten durchgeführt werden, um zu ermitteln, ob die Daten einen von Ihnen definierten Satz von Toleranzwerten erfüllen oder nicht. Bei diesen Tests werden entweder Daten von der weiteren Verarbeitung entfernt oder Daten, die eine Qualitätsverbesserungen benötigen, markiert.


QC-Datensätze

Quality Control-Datensätze

QC-Datensätze enthalten Informationen über die Qualität der gemessenen GPS-Position. Sie werden mit dem Punkt-Datensatz gespeichert.


Verhältnis

Während der Initialisierung bestimmt der Empfänger die ganzzahlige Anzahl von Wellenlängen für jeden Satelliten. Für einen bestimmten Satz von ganzen Zahlen ermittelt er die Wahrscheinlichkeit, daß dies der richtige Satz ist.

Das Verhältnis ist das Verhältnis von der Richtigkeitswahrscheinlichkeit des gegenwärtig besten Satzes von ganzen Zahlen zu der des nächstbesten Satzes. Ein hoher Verhältniswert zeigt an, daß der beste Satz von ganzen Zahlen wesentlich besser ist als jeder andere Satz, und bestätigt seine Richtigkeit. Dies ist ein Indikator dafür, daß der Satz richtig ist. Das Verhältnis muß für Neuer Punkt- und OTF-Inititialisierungen größer als 5 sein.


RDOP

Relative Dilution of Precision (Relative Präzisionsminderung der Position)


Echtzeit-Kinematisch

Eine GPS-Vermessungsmethode in Echtzeit, die kurze (Stop & Go) Besetzungen verwendet, während mindestens vier Satelliten verfolgt werden. Diese Methode erfordert eine drahtlose Datenverbindung (Funkverbindung) zwischen den Basis- und Rover-Empfängern.


Rechtwinklige Koordinaten

Koordinaten in jedem System, in dem sich die Bezugsachsen in rechten Winkeln schneiden.


Reduziertes Spaltenprofil

Eine verkürzte Version der normalen Gleichungen, in der die Gleichungen umsortiert sind, um den Speicher des Computers zu reduzieren, der erforderlich ist, um alle Elemente ungleich Null zu speichern.


Redundanz

Der Betrag, um den ein Festpunktnetz überbestimmt ist oder mehr Beobachtungen aufweist als notwendig sind, um seine Bestandteile zu berechnen.


Redundanzzahl

Ein Maß der Freiheitsgrade in einem Teil - nicht der Gesamtheit - eines Festpunktnetzes.


Redundante Basislinien

Eine Basislinie, deren Beobachtung zu einem Punkt durchgeführt wurde, der bereits durch andere Beobachtungen mit dem Netz verbunden wurde. Eine redundante Basislinie kann entweder eine unabhängige erneute Beobachtung einer vorherigen Messung oder eine Beobachtung zu einem Punkt von einer anderen Basis sein. Sie ist redundant, da sie mehr Informationen liefert als notwendig sind, um einen Punkt eindeutig zu bestimmen. Redundante Beobachtungen sind jedoch sehr nützlich, da sie eine Qualitätsüberprüfung vorheriger Messungen bieten.


Redundante Beobachtung

Eine wiederholte Beobachtung oder eine Beobachtung, die zu der Überbestimmung eines Netzes beiträgt.


Referenzfaktor

Siehe Mittlerer Fehler der Gewichtseinheit.


Referenzrahmen

Das Koordinatensystem eines Datums.


Referenzstation

Dies ist eine Basisstation.


Referenzvarianz

Das Quadrat des Referenzfaktors.


Relative Fehler

Fehler und Genauigkeiten, die für Paare und zwischen Paaren von ausgeglichenen Festpunkten ausgedrückt werden.


Restwert

Die Korrektur, oder Ausgleichung, einer Beobachtung, um einen Gesamtabschluß in einem Festpunktnetz zu erreichen. Der Restwert bezeichnet zudem jede Differenz zwischen einer beobachteten Menge und einem berechneten Wert für diese Menge.


RINEX

Receiver INdependent EXchange format

Ein Standard-Dateiformat für GPS-Rohdaten, das verwendet wird, um Dateien verschiedener Empfängerhersteller auszutauschen.


RMS

Root Mean Square (Quadratischer Mittelwert)

RMS zeigt die Genauigkeit von Punktmessungen an. Dabei handelt es sich um den Radius des Fehlerkreises, in dem ungefähr 70% der festgelegten Positionen gefunden wurden. Er kann in Streckeneinheiten oder in Wellenlängenzyklen ausgedrückt werden.


Rotierter Meridian

Eine Zonenkonstante für die gedrehte Mercator-Kartenprojektion.


Rotation

Eine Rotation wird bei Transformationen verwendet. Die Rotation ist der Winkel, um den eine Koordinatenachse um den Koordinatensystemursprung gedreht wird.


Rover

Jeder mobile GPS-Empfänger und Feldcomputer, der Daten im Feld sammelt. Die Position eines Rover-Empfängers kann differentiell im bezug auf einen stationären GPS-Basisempfänger korrigiert werden.


RTCM

Radio Technical Commission for Maritime Services

Eine Kommission, die eingerichtet wurde, um eine differentielle Datenverbindung für die Echtzeit-differentielle Korrektur von bewegten GPS-Empfängern zu definieren. Es existieren zwei von RTCM definierte differentielle Korrekturmeldungstypen, aber alle Trimble GPS-Empfänger verwenden das neuere Typ-2-RTCM-Protokoll.


RTK

Real-Time Kinematic

Echtzeit-kinematisch. Ein GPS-Vermessungstyp.


Satellitengeometrie

Die Position und Bewegung von GPS-Satelliten während einer GPS-Vermessung.


Skalar

Bei der Methode der kleinsten Quadrate ein Wert, der auf die Varianzen (Fehler) angewendet wird, basierend auf dem erforderlichen Vertrauensintervall.


Skalargewichtung

Der Prozeß, bei dem ein Skalar auf die geschätzten Fehler angewendet wird, um die richtige Gewichtung der Beobachtung zu erzielen. Die drei Skalartypen, die in einer Netzausgleichung in der Trimble Geomatics Office-Software verfügbar sind, sind:

  Voreinstellung bedeutet, daß der Skalar auf 1,00 eingestellt ist; der anfänglich geschätzte Fehler bleibt derselbe

  Alternativ bedeutet, daß der Skalar auf den Referenzfaktor der vorherigen Ausgleichung eingestellt ist

  Benutzerdefiniert bedeutet, daß Sie einen Wert für den Skalar eingeben können

Der Skalar wird auf die Beobachtungsfehler unter Verwendung der folgenden Methoden angewendet:

  Alle Beobachtungen

  Jede Beobachtung

  Varianzgruppen


Maßstab

Ein Multiplikator, der auf Koordinaten und andere lineare Variablen angewendet wird, wie zum Beispiel bei Kartenprojektionen und Transformationen.


SDMS

Survey Data Management System

Eine Reihe von Formatdefinitionen zum Speichern von Vermessungsdaten. Dieses System wird von AASHTO (American Association of State Highway and Transportation Officials) verwaltet.


Selektive Verfügbarkeit (S/A)

Selective Availability

Künstliche Verschlechterung des GPS-Satellitensignals durch das US Department of Defense (U.S.-Verteidigungsminsterium). Der durch S/A hervorgerufene Positionsfehler kann bis zu 100 Meter betragen.


Große Halbachse

Eine Hälfte der Großen Achse.


Kleine Halbachse

Eine Hälfte der Kleinen Achse.


Sitzung

Ein Zeitraum, während dessen ein oder mehrere GPS-Empfänger Satellitenmeßdaten aufzeichnen.


Standpunktfehler

Fehler in der Dreifuß-Zentrierung oder Instrumentenhöhe an einem Festpunkt.


Polarpunkt

Eine beobachtete Basislinie ohne Redundanz.


Sigma

Ein mathematisches Symbol oder Ausdruck für den mittleren Fehler.


Einfrequenz

Ein Empfängertyp, der nur das L1-GPS-Signal verwendet. Es gibt keinen Ausgleich für ionosphärische Effekte.


Örtliche Anpassung

Ein Vorgang der Berechnung von Parametern, die die Beziehung zwischen WGS-84-Positionen (Breitengrad, Längengrad und ellipsoidische Höhe), die durch GPS-Beobachtungen bestimmt wurden, und örtlichen Koordinaten herstellt, die durch eine Kartenprojektion und Höhen über Normalnull definiert sind. Die Parameter werden verwendet, um örtliche Gitternetz-Koordinaten von WGS-84 (und umgekehrt) in Echtzeit im Feld zu erzeugen, wenn RTK-Vermessungsmethoden eingesetzt werden.


Sky-Plot

Ein polarer Plot, der die Wege der sichtbaren Satelliten für den gewählten Ansichtszeitraum anzeigt. Die Höhe des Satelliten wird in Grad über dem Horizont und der Azimut in Grad von der Ost-West-Richtung in der Statusleiste angezeigt.


Lösungstypen

Eine Beschreibung sowohl der Daten als auch der Methoden, die verwendet werden, um Basislinienlösungen aus GPS-Messungen zu erhalten. Typische Lösungstypen enthalten Beschreibungen wie Code, Float und Fixed. Diese beschreiben Methoden, die vom Basislinienverarbeitungsprogramm zur Berechnung einer Basislinienlösung verwendet werden. Lösungstypen können auch Beschreibungen wie L1, L2, Wide lane, Narrow lane oder Iono-frei enthalten. Diese beschreiben die Art und Weise, wie die GPS-Messungen kombiniert werden, um bestimmte Ergebnisse zu erzielen. Für weitere Information siehe die Literaturhinweise zur GPS-Verarbeitung in der Bibliographie für eine ausführlichere Beschreibung dieser Begriffe und Methoden.


Schrägstrecke

Die Strecke in der Ebene, die parallel zu der vertikalen Differenz (Gefälle) zwischen den Punkten ist.


SNR

Signal-to-Noise Ratio (Signal-Rausch-Verhältnis)

Ein Maß der Signalstärke eines Satelliten. Die SNR befindet sich im Bereich von 0 (kein Signal) bis etwa 35.


Mittlerer Fehler

Eine statistische Fehlerschätzung, gemäß der 68 Prozent einer unbegrenzten Anzahl an Beobachtungen theoretisch absolute Fehler aufweisen, die kleiner oder gleich diesem Wert sind.


Mittlerer Fehler der Gewichtseinheit

Ein Maß der Größenordnung von Beobachtungsrestwerten in einem ausgeglichenen Netz, im Vergleich zu geschätzten Beobachtungsfehlern vor der Ausgleichung.


State Plane-Koordinaten

Spezielle Definitionen von Transversal-Mercator- und Lambert-konformen Kartographieprojektionen, wie sie in den USA per Gesetz übernommen wurden. Es existiert jeweils ein Satz solcher Zonen für NAD-27 und NAD-83.


Statisch (Vermessen)

Eine GPS-Vermessungsmethode, die lange Besetzungen verwendet (in einigen Fällen sogar Stunden), um GPS-Rohdaten aufzuzeichnen, und dann nachverarbeitet, um Genauigkeiten im Millimeterbereich zu erzielen.


Statisches Netz

Das statische Netz beschreibt die Geometrie und Reihenfolge, in der mit statischen und FastStatic-Methoden aufgezeichnete GPS-Basislinien organisiert und verarbeitet werden. Das Basislinienverarbeitungsprogramm untersucht das Projekt zuerst nach Punkten mit Koordinaten der höchsten Qualität und baut dann das Berechnungsnetz von diesen Punkten aus auf. Das Ergebnis ist ein Satz statischer Basislinien, die unter Verwendung genauer Anfangskoordinaten abgeleitet wurden.


Status

Jede Beobachtung und jeder Satz eingegebener Koordinaten für einen Punkt hat ein Statusfeld (verfügbar auf der Seite Zusammenfassung des Eigenschaftsfensters).

Der Status kann Aktiviert, Als Prüfpunkt aktiviert oder Deaktiviert sein:

 Aktivierte Beobachtungen und Koordinaten werden bei der Neuberechnung immer verwendet, um die berechnete Position für den Punkt zu ermitteln

 Als Prüfpunkt aktivierte Beobachtungen und Koordinaten werden nur verwendet, wenn es keine aktivierten Beobachtungen oder Koordinaten gibt

 Deaktivierte Beobachtungen und Koordinaten werden nie verwendet


Stochastisches Modell

Eine allgemeine Referenz zu den Methoden, die verwendet werden, um Fehler in einer Netzausgleichung abzuschätzen.


Teilnetz

Ein Satz Basislinien, die über gemeinsame Festpunkte miteinander verbunden sind und von allen anderen Basislinien unabhängig (getrennt) sind. In der Trimble Geomatics Office-Software kann ein Netz aus einem oder mehreren Teilnetzen bestehen, und jedes Teilnetz kann aus nur einer Basislinie und zwei Festpunkten bestehen.


Super-trak

Eine Trimble-eigene Methode zur Verarbeitung des L2-Signals, wenn der P-Code verschlüsselt ist.


Vermessungsbeobachtungen

Messungen, die an oder zwischen Festpunkten unter Verwendung von Vermessungsausrüstung einschließlich GPS-Empfängern und konventionellen Instrumenten vorgenommen wurden.


SV

Satellite Vehicle (oder Space Vehicle). Ein Satellit.


Symbole und Linientypen

Symbole und Linientypen werden mit Hilfe der Trimble Programme Symbol und Line Type Editor verwaltet. Verwenden Sie diese Editor-Programme, um neue Symbole und Linientypen zu erzeugen und bestehende zu bearbeiten. Symbole sind in Symbol-Bibliotheken und Linientypen in Linientyp-Bibliotheken gespeichert.

Die Trimble Geomatics Office-Software arbeitet mit Hilfe der aktuellen Symbol- und Linientyp-Bibliotheken des Systems. Wenn Sie eine bearbeitete Bibliothek speichern, können Sie diese zur System-Bibliothek machen (wenn es sich nicht bereits um die aktuelle System-Bibliothek handelt).


Systematische Fehler

Ein Fehler, der mit dem selben Vorzeichen und oftmals in der selben Größenordnung in einer Reihe von in Zusammenhang stehenden Beobachtungen auftritt.


Tau (Wert)

Ein Wert, der von einer internen Häufigkeitsverteilung berechnet wurde, basierend auf der Anzahl von Beobachtungen, Freiheitsgraden und einem gegebenen Wahrscheinlichkeitsprozentsatz (95%). Dieser Wert wird verwendet, um zu ermitteln, ob eine Beobachtung nicht zu den anderen Beobachtungen in der Ausgleichung paßt. Wenn der Restwert einer Beobachtung den Tau-Wert überschreitet, wird er als Ausreißer gekennzeichnet und im Histogramm durch vertikale Linien links und rechts der Mittellinie jenseits des kritischen Tau-Wertes dargestellt.


Tau-Kriterium

Statistische Methode zur Ermittlung von Beobachtungsausreißern nach Allen Pope. Für weitere Informationen siehe Pope (1976).


TDOP

Time Dilution of Precision (Zeitliche Präzisionsminderung der Position)


Terrestrische Beobachtung

Eine terrestrische Beobachtung ist eine Beobachtung im Feld unter Verwendung eines Laser-Entfernungsmessers oder konventionellen Vermessungsinstruments.


TOW

Time of Week

TOW in Sekunden, von Mitternacht Samstag nacht/Sonntag morgen (GPS-Zeit).


Verfolgung

Der Prozeß, Signale von einem Satelliten zu empfangen und zu erkennen.


Transformation

Die Rotation, Verschiebung und Skalierung eines Netzes, um es von einem Koordinatensystem zu einem anderen zu verschieben.


Transformationsgruppe

Eine ausgewählte Gruppe von Beobachtungen, die verwendet wird, um Transformationsparameter zu berechnen, die nur für diese Gruppe von Beobachtungen gelten. Normalerweise haben die Beobachtungen innerhalb der Gruppe den selben Typ mit ähnlichen Fehlern und wurden mit der selben Methode gemessen.


Transformationsparameter

Ein Satz von abgeleiteten oder benutzerdefinierten Parametern für eine Netzausgleichung, die ein Datum in ein anderes umwandeln. Die Parameter werden für GPS normalerweise erzeugt, um das WGS-84 Datum in das örtliche Datum umzuwandeln.


Dreifuß

Zentriervorrichtungen für die Befestigung von GPS-Antennen und anderen Vermessungsinstrumenten auf Vermessungsstativen.


Dreifuß-Zentrierfehler

Die Fehler, die mit der Zentrierung des Dreifußes über dem beobachteten Punkt verbunden sind. Diese Fehler sind geschätzt. Die Schätzung basiert auf der Überprüfung der Qualität der Vermessungsmethoden und sollte konservativ sein.


Troposphärenkorrektur

Troposphärenkorrektur

Die Korrektur, die auf eine Satellitenmessung angewendet wird, um troposphärische Verzögerungen zu korrigieren.


Troposphären-Modell

Troposphären-Modell

GPS-Signale werden durch die Troposphäre verzögert. Der Betrag der Verzögerung hängt von der Temperatur, Luftfeuchtigkeit, dem Druck, der Höhe der Station über Normalnull und der Höhe der GPS-Satelliten über dem Horizont ab. Um diese Verzögerungen zu berücksichtigen, können Korrekturen an Code- und Phasenmessungen unter Verwendung eines Troposphären-Modells vorgenommen werden.


Univariate

Eine mathematische Funktion, die das Verhalten von eindimensionalen Zufallsfehlern beschreibt für:

  Winkel

  Strecke

  Höhenunterschied

  Orthometrische Höhe

  Ellipsoidische Höhe


URA

User Range Accuracy

Ein Maß der Fehler, die durch Satellitenprobleme und Selektive Verfügbarkeit (S/A) eingeführt werden können, wenn ein bestimmter Satellit (SV) verwendet wird. Ein URA von 32 m deutet an, daß S/A aktiviert ist. Der URA-Wert wird vom Kontrollsegment festgelegt und von den Satelliten gesendet.


Unbekannte

Die berechneten Ausgleichungen für Koordinaten- und Transformationsparameter. Wird auch verwendet, um Beobachtungsrestwerte zu berechnen.


US National Survey

US-Regierungsbehörde, die das nationale geodätische Datum und alle geodätischen Festpunktnetze innerhalb der USA verwaltet.


US-Vermessungs-Fuß

1200/3937 Meter. Die offizielle lineare Maßeinheit für NAD-27.


UTC

Universal Time Coordinated

Ein Zeitstandard, der auf der örtlichen mittleren Sonnenzeit am Greenwich-Meridian basiert. Siehe auch GPS-Zeit.


Varianz

Das Quadrat des mittleren Fehlers.


Varianzkomponentenschätzung

Eine Kleinste-Quadrate-Methode für die Schätzung des relativen Fehlers unterschiedlicher Anteile eines Netzes.


Varianzkomponentengruppe

Eine der Gruppen von Beobachtungen, für die Varianzkomponentenschätzung in einer Netzausgleichung verwendet wird.


Varianz-Kovarianzmatrix

Die Zahlengruppe, die die Varianzen und Kovarianzen in einer Gruppe von Beobachtungen angibt.


VDOP

Vertical Dilution of Precision (Vertikale Präzisionsminderung der Position)


Vektor

Eine dreidimensionale Linie zwischen zwei Punkten.


Vertikale

Ähnlich der Normalen. Die Vertikale (Lotsenkrechte) wird von der Tangentenebene zum Geoid anstatt zum Ellipsoid berechnet.


Vertikale Ausgleichung

Eine Netzausgleichung von lediglich vertikalen Beobachtungen und Koordinaten.


Vertikaler Festpunkt

Ein Punkt mit lediglich vertikaler Koordinatengenauigkeit. Die horizontale Position hat eine niedrigere Genauigkeit oder ist unbekannt.


WAVE

Weighted Ambiguity Vector Estimator

WAVE ist das Trimble Basislinienverarbeitungsprogramm. Es berechnet GPS-Vektoren von Feldbeobachtungen, die mit statischen, FastStatic- oder kinematischen Datenerfassungsmethoden vorgenommen wurden.


Gewichtung

Der Richtungswinkel/Strecke der Varianz einer Beobachtung.


Gewichtungsstrategie

Die Sammlung von Werten, die verwendet werden, um die Varianz-Kovarianzmatrizen in der Trimble Geomatics Office-Software zu verbessern.


Gewichtungen

Der Satz Gewichtungen oder der Richtungswinkel/Strecke der Varianz-Kovarianzmatrix von korrelierten Beobachtungen.


WGS-84

World Geodetic System (1984) (Geodätisches Weltsystem)

Das seit Januar 1987 von GPS verwendete mathematische Ellipsoid.


Wide lane

Eine lineare Kombination von L1- und L2-Trägerphasen-Beobachtungen (L1 − L2). Sie ist von Nutzen wegen ihrer kurzen effektiven Wellenlänge (86,2 cm) und für das Auffinden von ganzzahligen Mehrdeutigkeiten auf langen Basislinien.


X, Y und Z

Im geozentrischen kartesischen System bezieht sich X auf die Richtung der Koordinatenachse, die vom Systemursprung zum Greenwich-Meridian verläuft; Y auf die Achse, die vom Ursprung durch den Meridian 90° östlicher Länge verläuft, und Z auf die Richtung durch die polare Eisdecke. In rechtwinkligen Koordinatensystemen bezieht sich X auf die Ost-West-Achse, Y auf die Nord-Süd-Achse und Z auf die Höhenachse.


Y-Code

Y-Code ist eine verschlüsselte Form der im P-Code enthaltenen Information. Satelliten übertragen den Y-Code anstelle des P-Codes, wenn Anti-Spoofing aktiviert ist.


Zenit-Verzögerung

Die von der Troposphäre verursachte Verzögerung eines GPS-Signals, das von einem Satelliten direkt über Ihnen beobachtet wurde. Wenn sich ein Satellit dem Horizont nähert, verlängert sich der Signalweg durch die Troposphäre und die Verzögerung wird größer.


Genaue GPS-Ephemeriden-Dateien

Eine Genaue Ephemeriden-Datei enthält genaue Positionsdaten und Uhrkorrekturen für jeden Satelliten über einen bestimmten Zeitraum, gewöhnlich einen Tag. Diese Information wird vom Basislinienverarbeitungsprogramm verwendet, um die Basisliniengenauigkeit durch die Reduzierung der Auswirkungen von Broadcast-Ephemeriden-Fehlern zu verbessern. Die Verwendung genauer Ephemeriden hilft dem Basislinienverarbeitungsprogramm zudem, Fixed-Lösungen auf langen Basislinien zu erreichen.

Trimble Geomatics Office unterstützt die Verwendung von genauen Ephemeriden in zwei Dateiformaten:

  .sp3 − Ein von U.S. National Geodetic Survey definiertes ASCII-Format. Dies ist das gebräuchlichste Format.

  .ef18 − Eine Binärdatei mit Informationen ähnlich der in den .sp3-Dateien enthaltenen Informationen. Die .ef18-Dateien erfordern weniger Plattenspeicher und können vom Basislinienverarbeitungsprogramm effizienter verwendet werden.

Die Verwendung von genauen Ephemeriden wird von der Option Ephemeriden im Dialogfeld GPS-Verarbeitungsstile gesteuert. Genaue Ephemeriden-Dateien müssen in jedes Projekt importiert werden, in dem sie verwendet werden sollen. Verwenden Sie Datei / Importieren, um eine oder mehrere Ephemeriden-Dateien in ein Projekt zu laden.

Ursprünglich lieferten genaue Ephemeriden–Dateien Satellitenpositionen und Uhrenfehler für den Zeitraum einer Woche. Aktuelle Dateien bieten diese Informationen bereits für einen einzigen Tag. Das bedeutet, daß die Dateien in einem kürzeren Zeitraum zur Verfügung gestellt werden können.

Das Basislinienverarbeitungsprogramm benötigt genaue Ephemeriden, die die Zeitspanne der gerade verarbeiteten GPS-Messungen um ein Minimum von acht SV-Epochen überschreiten (sowohl vor als auch nach dem Start der Daten). Diese zusätzlichen genauen Ephemeriden-Informationen sind erforderlich, um die korrekte Interpolation zu Beginn und am Ende der Vermessung sicherzustellen.

Das Importprogramm Genaue Ephemeriden führt folgendes durch:

  Es überprüft das Format der Datei. Wenn sich die Datei im .sp3-Format befindet, wird sie während des Importvorgangs automatisch in das .ef18-Format umgewandelt. Wenn sich die Datei im .ef18-Format befindet, wird sie direkt verwendet.

  Es ermittelt, ob es bestehende genaue Ephemeriden-Dateien gibt, die bereits in das Projekt geladen wurden. Falls dies der Fall ist, überprüft das Programm den Umfang dieser Dateien, um herauszufinden, ob die neue Datei denselben Zeitrahmen wie die bestehende Datei abdeckt. Falls dies der Fall ist, überschreibt die neue Datei die alte Datei. Der Import-Bericht enthält eine Warnmeldung, die darauf hinweist, daß die alte Datei überschrieben wurde.

  Kopiert die Datei in den Ordner Genaue Ephemeriden des Projekts.

Genaue Ephemeriden-Dateien sind bei einer Reihe von Institutionen erhältlich, einschließlich:

  U.S. National Geodetic Survey

  Center for Orbit Determination in Europe (CODE)

  European Space Agency

  Scripps Orbit and Permanent Array Center (SOPAC)

  Canadian Department of Energy, Mines and Resources (EMR)

  NASA Jet Propulsion Laboratory (JPL)


Eine Genaue Ephemeriden-Datei zu Ihrem Computer importieren (.sp3, .e18)

1.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Vermessung die Option Genaue Ephemeriden-Dateien (*.sp3, *.e18).

3.	Klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

4.	Ermitteln Sie die Position der .sp3- oder .e18-Dateien, die Sie importieren möchten.

5.	Klicken Sie auf Öffnen.

Die Dateien werden in den Ordner Genaue Ephemeriden des Projekts geladen.

HINWEIS: Wenn die zu importierenden Genauen Ephemeriden-Dateien denselben Zeitraum abdecken, wie die Genauen Ephemeriden-Dateien im Projekt, erscheint eine Meldung. Diese Meldung zeigt an, daß eine oder mehrere Meldungen während des Importvorgangs erzeugt wurden. Um die Details dieser Dateien anzusehen, klicken Sie in dieser Meldung auf Ja.

HINWEIS: Die Verwendung von genauen Ephemeriden wird von der Option Ephemeriden in den aktiven GPS-Verarbeitungsstilen gesteuert.


Registrierungsübersicht

Wenn Sie Ihre Trimble Geomatics Office Software registrieren und Ihre Anschrift angeben, kann Ihnen Trimble alle neue Informationen über die Software zukommen lassen, sobald diese verfügbar sind—einschließlich Informationen über Neuentwicklungen des Produkts. Ihre Registrierung hilft Trimble bei der kontinuierlichen Verbesserung der Software-Unterstützung und -Entwicklung.

Sie können Ihre Trimble Geomatics Office Software registrieren, wenn Sie beim Abschluß des Installationsvorgangs dazu aufgefordert werden, oder jederzeit in Trimble Geomatics Office.

So führen Sie dies durch:

1.	Wählen Sie Hilfe / Registrierung in Trimble Geomatics Office.

2.	Wählen Sie eine Registrierungsmethode. Sie können einen der folgenden Vorgänge durchführen:

  Füllen Sie das auf dem Internet verfügbare Registrierungsformular vollständig aus, und übermitteln Sie es.

  Drucken Sie das mitgelieferte Textregistrierungsformular aus, füllen Sie es aus, und senden Sie dieses Formular dann per Fax oder Post.

Die Fragen auf den Internet- und Fax/Post-Registrierungsformularen sind dieselben.

Ihre Angaben werden außerhalb von Trimble nicht verwendet oder weitergegeben. Die Registrierungsformulare enthalten auch Fragen darüber, wie und warum Sie Trimble Geomatics Office einsetzen. Diese Fragen sind nicht obligatorisch, aber Ihre Antworten helfen Trimble, seine Produkt-Unterstützung und die Produkt-Entwicklung kontinuierlich zu verbessern.


Registrierung - Per Internet
Registrierung − Per Internet

 Überblick und weitere Informationen

So registrieren Sie Ihre Trimble Geomatics Office Software über das Internet:

1.	Wählen Sie Hilfe / Registrierung / Per Internet. Die Online-Registrierungsseite erscheint in Ihrem Web-Browser.

2.	Füllen Sie das Formular aus, und vergewissern Sie sich, daß Sie Details in allen mit einem * gekennzeichneten Feldern angeben.

3.	Klicken Sie auf Send Registration Now.


Registrierung - Per Fax oder Post
Registrierung  − Per Fax oder Post

 Überblick und weitere Informationen

So registrieren Sie Ihre Trimble Geomatics Office Software per Fax oder Post:

1.	Wählen Sie Hilfe / Registrierung / Per Fax oder Post. Das Trimble Geomatics Office-Registrierungsformular erscheint in Ihrem voreingestellten Text-Editor.

2.	Füllen Sie das Formular aus, und vergewissern Sie sich, daß Sie Details in allen mit einem * gekennzeichneten Feldern angeben.

3.	Speichern Sie das Formular.

4.	Senden Sie das Formular an:

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

USA

Attention: Technical Publications Group

Fax: +1 720 887-6101


GPS-Schleifenschlußbericht - Überblick
    GPS-Schleifenschlußbericht − Überblick

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Überblick

Der GPS-Schleifenschlußbericht kann verwendet werden, um die Qualität eines Satzes von GPS-Beobachtungen innerhalb eines Netzes zu beurteilen. Sie können ihn verwenden, um die Ergebnisse Ihrer Basislinienverarbeitung auf Fehler zu prüfen (wenn Sie das Basislinienverarbeitungsmodul installiert haben). Um Schleifenabschlüsse zu erzeugen, müssen Sie jedoch Ihr Netz so gestalten, daß es geschlossene geometrische Figuren aufweist. Wenn dies der Fall ist, erzeugt Trimble Geomatics Office automatisch alle möglichen Schleifen und erstellt einen GPS-Schleifenschlußbericht.

Das Dialogfeld Schleifenschluß-Einstellungen wird verwendet, um zu bestimmen, wie Schleifen erzeugt und analysiert werden. Es wird auch verwendet, um den Umfang der Informationen im GPS-Schleifenschlußbericht festzulegen. Die Schleifenschluß-Einstellungen werden über Berichte / Einstellungen / Bericht GPS-Schleifenschluß aufgerufen.

Der GPS-Schleifenschlußbericht enthält gemäß Voreinstellung folgende Abschnitte:

  Kopfzeile

  Zusammenfassung

  Zurückgewiesene Schleifen

  Beobachtungen in zurückgewiesenen Schleifen

  Besetzungen in zurückgewiesenen Schleifen

Diese zusätzlichen Berichtabschnitte können durch Auswählen im Dialogfeld Schleifenschluß-Einstellungen zum Bericht hinzugefügt werden:

  Details zurückgewiesene Schleifen

  Akzeptierte Schleifen

  Details akzeptierte Schleifen

Beachten Sie diese Richtlinien:

  Es werden kleine Abschlußfehler gewünscht. Ein großer Abschlußfehler zeigt an, daß es ein Problem bei einer oder mehreren Beobachtungen in der Schleife gibt.

  Große Abschlußfehler werden oft durch Fehler bei der Feldarbeit verursacht, wie z. B. die Eingabe falscher Antenneninformationen oder schlechte Standpunkteinrichtungen. Prüfen Sie Ihre Feld-Notizen auf Informationen, die im Zusammenhang mit Beobachtungen stehen, die in mehreren zurückgewiesenen Schleifen enthalten sind.

  Wenn Sie Ihr Netz so gestalten, daß es aus geschlossenen geometrischen Figuren besteht, stellen Sie sicher, daß das Netz so beobachtet wird, daß es Basislinien aus verschiedenen Sitzungen in jeder Figur gibt. Wenn eine Schleife mit Basislinien erzeugt wird, die alle in der gleichen Sitzung beobachtet wurden, werden gemeinsame Fehler bei der Standpunkteinrichtung nicht entdeckt.

HINWEIS: Der Schleifenschlußbericht enthält Sprungmarken zu den GPS-Schleifen in der Vermessungsansicht.


GPS-Schleifenschlußbericht - Kopfzeile
    GPS-Schleifenschlußbericht − Kopfzeile

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Der Berichtskopf ist in jedem Bericht enthalten. Er enthält Auszüge aus den allgemeinen Projektinformationen und einen Inhaltsabschnitt. Der Inhaltsabschnitt hat Sprungmarken (Hyperlinks), die verwendet werden, um zu den verschiedenen Berichtabschnitten zu springen.

Er enthält die folgenden Felder. Die meisten dieser Felder enthalten Informationen, die Sie in den Projekteigenschaften eingestellt haben:

Projekt

Dieses Feld zeigt den Namen des Projekts an.

Benutzername

Dieses Feld zeigt den Namen an.

Datum & Zeit

Dieses Feld zeigt das Datum und den Erstellungszeitpunkt des Berichts an.

Koordinatensystem

Dieses Feld zeigt das Koordinatensystem an.

Zone

Dieses Feld zeigt die Koordinatensystemzone an. Wenn eine GPS-Kalibrierung für das Koordinatensystem gewählt ist, erscheint der Name, der der örtlichen Anpassung zugewiesen wurde, im Feld Zone.

Alle veröffentlichten Koordinatensysteme haben eine Zone. Die voreingestellte Projektion bildet eine Ausnahme: im Feld Zone wird “Voreinstellung” angezeigt. Die Voreinstellung wird verwendet, wenn die Koordinaten einer örtlichen Anpassung geschätzt werden, z. B. Ho = 10000, Re = 10000 und Höhe = 100.

Projektdatum

Dieses Feld zeigt das Projektdatum an. Das Projektdatum ist nicht das für die Ausgleichung gewählte Datum.

Vertikales Datum

Sie können dieses Feld zu den in der Kopfzeile des Netzausgleichungsberichts enthaltenen Informationen hinzufügen. Tragen Sie dazu die notwendigen Details in das Feld Vertikales Datum im Register Projektdetails des Dialogfelds Projekteigenschaften ein.

Geoid-Modell

Dieses Feld zeigt das Geoid-Modell an, wenn ein Modell in den Projekteigenschaften gewählt wurde. Wenn dem Projekt kein Geoid-Modell zugewiesen wurde, wird „Nicht gewählt“ in diesem Feld angezeigt.

Koordinateneinheiten

Dieses Feld zeigt die Einheiten des Koordinatensystems an.

Streckeneinheiten

Dieses Feld zeigt die Streckeneinheiten an.

Ellips. Höheneinheiten

Dieses Feld zeigt die ellipsoidischen Höheneinheiten an.

Inhalt

Der Inhalt des GPS-Schleifenschlußberichts wird von den Einstellungen im Dialogfeld Schleifenschluß-Einstellungen bestimmt. Der GPS-Schleifenschlußbericht enthält gemäß Voreinstellung folgende Abschnitte:

  Kopfzeile

  Zusammenfassung

  Zurückgewiesene Schleifen

  Beobachtungen in zurückgewiesenen Schleifen

  Besetzungen in zurückgewiesenen Schleifen

Diese zusätzlichen Berichtabschnitte können durch Auswählen im Dialogfeld Schleifenschluß-Einstellungen zum Bericht hinzugefügt werden:

  Details zurückgewiesene Schleifen

  Akzeptierte Schleifen

  Details akzeptierte Schleifen


GPS-Schleifenschlußbericht - Zusammenfassung
    GPS-Schleifenschlußbericht − Zusammenfassung

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch

Der Abschnitt Zusammenfassung bietet eine schnelle Übersicht über die Ergebnisse der Schleifenschluß-Analyse. Er ist im Standardbericht enthalten und enthält folgende Informationen:

Strecken in Schleife

Dieses Feld zeigt die Anzahl der Beobachtungen an, die verwendet wurden, um die Seiten der Schleife zu bilden. Die Voreinstellung ist 3. Wenn mehr als 3 Strecken angegeben sind, werden alle Schleifen mit dieser Anzahl Strecken oder weniger erzeugt. Beispiel: Wenn 5 festgelegt ist, werden alle Schleifen mit entweder 5, 4 oder 3 Seiten im Bericht berücksichtigt.

Anzahl Schleifen

Dieses Feld zeigt die Gesamtzahl der erzeugten Schleifen an.

Anzahl akzeptiert

Dieses Feld zeigt die Anzahl der Schleifen an, die die Akzeptanzkriterien erfüllt haben.

Anzahl zurückgewiesen

Dieses Feld zeigt die Anzahl der Schleifen an, die die Akzeptanzkriterien nicht erfüllt haben.

Kriterien für Akzeptanz/Zurückweisung

Diese Felder zeigen die absoluten horizontalen und vertikalen Toleranzwerte an.

Bester Abschuß

Diese Felder zeigen die Ergebnisse der besten erzeugten Schleife an.

Schlechtester Abschluß

Diese Felder zeigen die Ergebnisse der schlechtesten erzeugten Schleife an.

Durchschnittsschleife

Diese Felder zeigen die Mittelwerte aller für diesen Bericht erzeugten Schleifen an.

Standard-Abweichung

Diese Felder zeigen die Standardabweichungen aller für diesen Bericht erzeugten Schleifen an.


GPS-Schleifenschlußbericht - Zurückgewiesene Schleifen
    GPS-Schleifenschlußbericht − Zurückgewiesene Schleifen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Der Abschnitt Zurückgewiesene Schleifen enthält Informationen über jede Schleife, die die Abschlußfehler-Toleranzprüfung nicht besteht. Eine Schleife wird zurückgewiesen, wenn die Abschlußfehler größer sind als die im Dialogfeld Schleifenschluß-Einstellungen festgelegten Toleranzen. Dieser Abschnitt ist im Standardbericht enthalten.

Beispiel für einen Berichtausschnitt, der eine zurückgewiesene Schleife enthält:

GPS-Schleife 1:
MOON 2:WAVE:N 245:MOON 2

Beobachtungen:

		Von	Zu	Lösungstyp	Startzeit
BL3	S1	MOON 2	WAVE	L1 fixed	13:45:03 24 Feb 1999
BL47	S5	MOON 2	WAVE	L1 fixed	13:11:03 24 Feb 1999
BL2	S8	WAVE	N 245	L1 fixed	13:45:03 24 Feb 1999
BL46	S4	MOON 2	N 245	L1 fixed	13:43:48 24 Feb 1999
BL49	S7	MOON 2	N 245	L1 fixed	12:28:33 24 Feb 1999

Zurückgewiesene Kombinationen für Schleife 1:

	Länge	dHoriz	dVert	PPM
S5 − S8 − S7	3295.499m	0.026m	0.034m	12.915

Beobachtungstabelle

Die ersten beiden Spalten in der Tabelle stellen die IDs (Kennzeichen) der Basislinie und der GPS-Beobachtungslösungen in der Schleife dar. Die ID der Basislinie stellt die Kombination zweier überlappender Sätze von GPS-Daten dar, die verarbeitet werden können, um eine Basislinie zu bilden. Die Lösungs-ID bezeichnet eine vom Basislinienverarbeitungsprogramm berechnete Lösung für die Basislinie. Es kann mehrere Lösungs-IDs für eine einzelne Basislinien-ID geben. Dies geschieht, wenn das Kontrollkästchen Doppelte Basislinienlösungen überschreiben beim Speichern von GPS-Verarbeitungsresultaten deaktiviert ist.

Die weiteren Spalten sind:

Von

Dieses Feld zeigt den Startpunkt der Beobachtung an.

Zu

Dieses Feld zeigt den Endpunkt der Beobachtung an.

Lösungstyp

Dieses Feld zeigt den Lösungstyp der Beobachtung an.

Startzeit

Dieses Feld zeigt die Startzeit der Beobachtung an.

Tabelle Zurückgewiesene Kombinationen für Schleife

Die Tabelle Zurückgewiesene Kombinationen für Schleife enthält die Kombinationen der GPS-Beobachtungen, deren Abschlußfehler größer sind als der festgelegte Toleranzwert. Das Beispiel enthält eine einzelne Kombination. Mehrfache Kombinationen werden aufgelistet, wenn mehrere Fehler auftreten. Die erste Tabellenspalte zeigt die Basislinienlösungen der zurückgewiesenen Kombination an.

TIP: Wenn Sie auf die zurückgewiesene Kombination klicken, werden die Beobachtungen in der Vermessungsansicht hervorgehoben.

Die weiteren Spalten sind:

Länge

Dieses Feld zeigt die Gesamtstrecke des Polygons um die Schleife an.

dHoriz

Dieses Feld zeigt den von dieser Schleife erzeugten horizontalen Abschlußfehler an.

dVert

Dieses Feld zeigt den von dieser Schleife erzeugten vertikalen Abschlußfehler an.

PPM

Dieses Feld zeigt die gesamten horizontalen und vertikalen Abschlußfehler an, angegeben in Teilen pro Million.


GPS-Schleifenschlußbericht - Beobachtungen in zurückgewiesenen Schleifen
    GPS-Schleifenschlußbericht − Beobachtungen in zurückgewiesenen Schleifen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Dieser Abschnitt hilft, GPS-Basislinien zu identifizieren, die nicht in das Netz passen. Alle zurückgewiesenen Schleifen werden untersucht, und die Basislinien angezeigt, die in mehreren zurückgewiesenen Schleifen gefunden werden. Diese Liste wird so sortiert, daß die Basislinien, die in den meisten zurückgewiesenen Schleifen auftreten, oben aufgelistet sind. Der Abschnitt kann auch eine Statistik der Basislinien-Zusammenfassung enthalten, die Ihnen helfen kann, schlechte Lösungen zu identifizieren.

Dieser Abschnitt ist im Standardbericht enthalten.

Beispiel eines Berichtsabschnitts:

		Von	Zu	Lösungstyp	Verhältnis	Ref Var	RMS	Häufigkeit
BL2	S8	WAVE	N 245	L1 fixed	21.8	2.489	0.006	3
BL47	S5	MOON 2	WAVE	L1 fixed	2.9	1.693	0.005	2
BL5	S19	COWBOY	KTOM	L1 fixed	8.5	1.117	0.009	1

Zurück zum Anfang

Die ersten beiden Spalten in der Tabelle stellen die IDs (Kennzeichen) der Basislinie und der GPS-Beobachtungslösungen dar, die in mehrfachen zurückgewiesenen Schleifen enthalten sind. Die ID der Basislinie stellt die Kombination zweier überlappender Sätze von GPS-Daten dar, die verarbeitet werden können, um eine Basislinie zu bilden. Die Lösungs-ID bezeichnet eine vom Basislinienverarbeitungsprogramm berechnete Lösung für die Basislinie. Es kann mehrere Lösungs-IDs für eine einzelne Basislinien-ID geben. Dies geschieht, wenn das Kontrollkästchen Doppelte Basislinienlösungen überschreiben beim Speichern von GPS-Verarbeitungsresultaten deaktiviert ist.

Die weiteren Spalten sind:

Von

Dieses Feld zeigt den Startpunkt der Beobachtung an.

Zu

Dieses Feld zeigt den Endpunkt der Beobachtung an.

Startzeit

Dieses Feld zeigt Zeit und Datum der GPS-Beobachtung an.

Verhältnis

Dieses Feld zeigt das bei der Basislinienverarbeitung bestimmte Verhältnis der GPS-Beobachtung an.

Ref Var

Dieses Feld zeigt die bei der Basislinienverarbeitung bestimmte Referenzvarianz der GPS-Beobachtung an.

RMS

Dieses Feld zeigt den bei der Basislinienverarbeitung bestimmten RMS der GPS-Beobachtung an.

Häufigkeit

Dieses Feld zeigt die Anzahl der zurückgewiesenen Schleifen an, in denen die GPS-Beobachtung enthalten war. Beobachtungen mit einer größeren Häufigkeit sollten dahingehend untersucht werden, wie gut Sie in Ihr Netz passen.


GPS-Schleifenschlußbericht - Besetzungen in zurückgewiesenen Schleifen
    GPS-Schleifenschlußbericht − Besetzungen in zurückgewiesenen Schleifen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Dieser Abschnitt hilft Ihnen, GPS-Standpunktbesetzungen für die Basislinien zu identifizieren, die nicht in das Netz passen. Diese Standpunktbesetzungen können Einrichtungsfehler bei der Station haben. Alle zurückgewiesenen Schleifen werden überprüft. Die Besetzungen von Basislinien, die in mehreren zurückgewiesenen Schleifen gefunden wurden, werden angezeigt.

Die Liste wird so sortiert, daß die Besetzungen, die in den meisten zurückgewiesenen Schleifen auftreten, oben aufgelistet sind.

Dieser Abschnitt ist im Standardbericht enthalten.

Beispiel eines Berichtsabschnitts:

Besetzungen in zurückgewiesenen Schleifen

Punkt	Startzeit	Häufigkeit
KTOM	10:46:18 24 Feb 1999	6
WAVE	13:11:03 24 Feb 1999	5
MOON2	12:04:48 24 Feb 1999	4
COWBOY	14:05:03 24 Feb 1999	3
N 245	12:28:33 24 Feb 1999	2
COWBOY	12:45:48 24 Feb 1999	1
Zurück zum Anfang

Die Spalten sind:

Punkt

Dieses Feld zeigt den Namen des besetzen Punkts an.

Startzeit

Dieses Feld zeigt die Startzeit der Besetzung an. Verwenden Sie diese Zeit, um Ihre Feldnotizen mit den im Projekt enthaltenen Informationen zu überprüfen.

Häufigkeit

Dieses Feld zeigt an, wie oft eine Beobachtung Teil einer zurückgewiesenen Schleife war. Besetzungen mit einer größeren Häufigkeit sollten auf Fehler beim Einrichten der Station überprüft werden.


GPS-Schleifenschlußbericht - Details zurückgewiesene Schleifen
    GPS-Schleifenschlußbericht − Details zurückgewiesene Schleifen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Dieser Abschnitt enthält detailliertere Informationen über alle Schleifen, die die Abschlußfehler-Toleranzprüfung nicht bestehen. Dieser Abschnitt ist nicht im Standardbericht enthalten. Sie können diesen Abschnitt im Dialogfeld Schleifenschluß-Einstellungen aktivieren.

Beispiel eines Berichtsabschnitts:

Details zurückgewiesene Schleifen

Schleife S1 - S86 - S3:

Von:	MOON 2
Zu:	WAVE		L1 fixed	13:45:02 24 Feb 1999
		Schrägstr:	962.407m	606819.055m
		Gesamt:	962.407m	1828548.125m
				29.499m
Zu:	N 245		L1 float	13:45:02 24 Feb 1999
		Schrägstr.	852.542m	606662.061m
		Gesamt:	1814.949m	1829386.030m
				33.251m
Zu:	MOON 2		L1 fixed	13:43:47 24 Feb 1999
		Schrägstr:	1480.504m	605983.905m
		Gesamt:	3295.453m	1828070.086m
				26.770m
Präzision:		32.407ppm
Fehler	Horiz:	0.096m	Vert:	–0.046m

Am Anfang der Tabelle befindet sich eine Liste der Basislinienlösungen, die Teil der Schleife sind. Danach folgt die Von-Station; sie stellt den Punkt dar, von dem die Schleife ausgeht.

Im Anschluß an diese ersten Informationen werden drei oder mehrere Unterabschnitte angezeigt, jeder jeweils vier Zeilen lang. Diese Unterabschnitte enthalten Standpunktinformationen in der Reihenfolge, in der sie das Programm um die Schleife herum anordnet. Die erste Zeile in jedem Unterabschnitt beginnt mit der Kennzeichnung Zu: Die folgenden Informationen erscheinen in den nachfolgenden Standpunktunterabschnitten:

Zeile 1

Die Kennzeichnung Zu: ist die erste Zeile eines vierzeiligen Unterabschnitts. Diese Zeile selbst enthält Informationen über die GPS-Beobachtung. Auf die Kennzeichnung Zu: folgen die Punktnamen, aufgelistet in der Reihenfolge, in der die Schleife angeordnet ist. Danach folgt der Typ der GPS-Beobachtung und das Datum, an dem die GPS-Messungen aufgezeichnet wurden.

Die in dieser Zeile enthaltenen Informationen entsprechen einer am oberen Ende der Tabelle aufgeführten Lösungs-ID. Detailliertere Informationen über eine bestimmte Basislinienlösung erhalten Sie, wenn Sie die  Statistik im Eigenschaftsfenster der Vemessungsansicht überprüfen oder einen GPS-Basislinienverarbeitungsbericht für diese Basislinie erzeugen.

Zeile 2

Die Kennzeichnung Schrägstr kennzeichnet die zweite Zeile eines vierzeiligen Unterabschnitts. Hinter dieser Kennzeichnung ist die Schrägstrecke der GPS-Beobachtung angegeben. Dahinter wird die Hochwert-Komponente der Koordinaten des aktuellen Zu-Punkts angezeigt.

Zeile 3

Die Kennzeichnung Gesamt kennzeichnet die dritte Zeile eines vierzeiligen Unterabschnitts. Hinter dieser Kennzeichnung ist die beim Erstellen der Schleife erzeugte Gesamtstrecke angegeben. Dahinter wird die Rechtswert-Komponente der Koordinaten des aktuellen Zu-Punkts angezeigt.

Zeile 4

Die letzte Zeile des Unterabschnitts hat keine Kennzeichnung. Sie enthält die orthometrische Höhe der Koordinaten des aktuellen Zu-Punkts.

HINWEIS: Die hier angegebenen Hochwert-, Rechtswert- und Höhen-Koordinaten sind nicht dieselben Koordinaten wie im Projekt. Die hier angezeigten Werte werden durch Addition der GPS-Beobachtungen zu den Anfangskoordinaten der Von-Station abgeleitet. Diese Vektor-Addition wird um die Schleife fortgeführt. Am Ende der Schleife werden die auf diese Weise abgeleiteten Koordinaten von den Anfangskoordinaten des Von-Punkts subtrahiert, um den Abschlußfehler zu erzeugen.

Der letzte Standpunktunterabschnitt in dieser Tabelle enthält die Von-Station, um anzuzeigen, daß die Schleife geschlossen wurde. Die letzten beiden Zeilen der Tabelle enthalten Informationen über den Abschlußfehler der Schleife.

Präzision

Dieses Feld zeigt den gesamten horizontalen und vertikalen Abschlußfehler an, angegeben in Teilen pro Million.

Fehler

Dieses Feld zeigt die von dieser Schleife erzeugten horizontalen und vertikalen Abschlußfehler an.


GPS-Schleifenschlußbericht - Akzeptierte Schleifen
    GPS-Schleifenschlußbericht − Akzeptierte Schleifen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Dieser Abschnitt enthält Informationen über alle Schleifen, die die Abschlußfehler-Toleranzprüfung bestehen. Eine Schleife wird akzeptiert, wenn die Abschlußfehler der Schleife kleiner oder gleich den festgelegten Toleranzen sind. Dieser Abschnitt ist nicht im Standardbericht enthalten. Sie können diesen Abschnitt im Dialogfeld Schleifenschluß-Einstellungen aktivieren.

Beispiel eines Berichtabschnitts:

Akzeptierte Schleifen

GPS-Schleife 1:
MOON 2: WAVE: COWBOY: MOON 2

Beobachtungen:

Basislinien-ID	Lösungs-ID	Von	Zu	Lösungstyp	Startzeit
BL3	S1	MOON 2	WAVE	L1 fixed	13:45:02 24 Feb 1999
BL47	S4	MOON 2	WAVE	L1 fixed	13:11:02 24 Feb 1999
BL1	S9	WAVE	COWBOY	L1 fixed	14:05:02 24 Feb 1999
BL45	S2	MOON 2	COWBOY	L1 fixed	14:05:02 24 Feb 1999
BL48	S5	MOON 2	COWBOY	L1 fixed	12:45:47 24 Feb 1999
Akzeptierte Kombinationen für Schleife 1:

	Länge	dHoriz	dVert	PPM
S1 - S9 - S2	3795.569m	0.001m	-0.002m	0.508
S1 - S9 - S5	3795.577m	0.009m	0.001m	2.296
S4 - S9 - S2	3795.568m	0.018m	-0.012m	5.683
S4 - S9 - S5	3795.577m	0.020m	-0.009m	5.872

Beobachtungstabelle

Die ersten beiden Spalten in der Tabelle stellen die IDs (Kennzeichen) der Basislinie und der GPS-Beobachtungslösungen  in der Schleife. Die Basislinien-ID stellt die Kombination zweier überlappender Sätze von GPS-Daten dar, die verarbeitet werden können, um eine Basislinie zu bilden. Die Lösungs-ID bezeichnet eine vom Basislinienverarbeitungsprogramm berechnete Lösung für die Basislinie. Es kann mehrere Lösungs-IDs für eine einzelne Basislinien-ID geben. Dies geschieht, wenn das Kontrollkästchen Doppelte Basislinienlösungen überschreiben beim Speichern von GPS-Verarbeitungsresultaten deaktiviert ist.

Die weiteren Spalten sind:

Von

Dieses Feld zeigt den Startpunkt der Beobachtung an.

Zu

Dieses Feld zeigt den Endpunkt der Beobachtung an.

Lösungstyp

Dieses Feld zeigt den Lösungstyp der Beobachtung an.

Startzeit

Dieses Feld zeigt die Startzeit der Beobachtung an.

Tabelle Akzeptierte Kombinationen für Schleife #

Die Tabelle Akzeptierte Kombinationen für Schleife identifiziert die Kombination der GPS-Beobachtungen, die die für Abschlußfehler festgelegten Akzeptanzkriterien erfüllt. Die erste Spalte zeigt die Lösungen der Basislinien in der akzeptierten Kombination an.

TIP: Wenn Sie auf die akzeptierte Kombination klicken, werden die Beobachtungen in der Vermessungsansicht hervorgehoben.

Die zweite Gruppe von Spalten ist:

Länge

Dieses Feld zeigt die Gesamtstrecke des Polygons um die Schleife an.

dHoriz

Dieses Feld zeigt den von dieser Schleife erzeugten horizontalen Abschlußfehler an.

dVert

Dieses Feld zeigt den von dieser Schleife erzeugten vertikalen Abschlußfehler an.

PPM

Dieses Feld zeigt den gesamten horizontalen und vertikalen Abschlußfehler an, angegeben in Teilen pro Million.


GPS-Schleifenschlußbericht - Details akzeptierte Schleifen
    GPS-Schleifenschlußbericht − Details akzeptierte Schleifen

Weitere Informationen

Wie kann ich ...	Bericht	Siehe auch
Dieser Abschnitt enthält detailliertere Informationen über alle Schleifen, die die Abschlußfehler-Toleranzprüfung bestanden haben. Dieser Abschnitt ist nicht im Standardbericht enthalten. Sie können diesen Abschnitt im Dialogfeld Schleifenschluß-Einstellungen aktivieren.

Beispiel eines Berichtabschnitts:

Details akzeptierte Schleifen

Schleife S1 - S9 - S2:

Von:	MOON 2
Zu:	WAVE		L1 fixed	13:45:02 24 Feb 1999
		Schrägstr:	962.407m	606819.055m
		Gesamt:	962.407m	1828548.125m
				29.499m
Zu:	COWBOY		L1 fixed	14:05:02 24 Feb 1999
		Schrägstr:	1076.569m	607738.388m
		Gesamt:	2038.976m	1827988.084m
				22.331m
Zu:	MOON 2		L1 fixed	14:05:02 24 Feb 1999
		Schrägstr:	1756.593m	605983.815m
		Gesamt:	3795.569m	1828070.120m
				26.815m
Präzision:	0.50858508651573ppm
Fehler	Horiz:	0.001m	Vert:	–0.002m

Am Anfang der Tabelle befindet sich eine Liste der Basislinienlösungen, die Teil der Schleife sind. Danach folgt die Von-Station, die den Punkt darstellt, von dem die Schleife ausgeht.

Auf diese ersten Informationen folgen drei oder mehrere Unterabschnitte, jeder jeweils vier Zeilen lang. Diese Unterabschnitte enthalten Standpunktinformationen in der Reihenfolge, in der sie das Programm um die Schleife herum anordnet. Die erste Zeile in jedem Unterabschnitt beginnt mit der Kennzeichnung Zu: Die folgenden Informationen erscheinen in den nachfolgenden Standpunktunterabschnitten:

Zeile 1

Die Kennzeichnung Zu: ist die erste Zeile eines vierzeiligen Unterabschnitts. Diese Zeile selbst enthält Informationen über die GPS-Beobachtung. Hinter der Kennzeichnung Zu: steht der Name des Punkts, aufgelistet in der Reihenfolge, in der die Schleife angeordnet ist. Danach folgt der Typ der GPS-Beobachtung und das Datum, an dem die GPS-Messungen aufgezeichnet wurden.

Die in dieser Zeile enthaltenen Informationen entsprechen einer am oberen Ende der Tabelle aufgeführten Lösungs-ID. Detailliertere Informationen über eine bestimmte Basislinienlösung erhalten Sie, indem Sie die Statistik im Eigenschaftsfenster der Vemessungsansicht überprüfen oder einen GPS-Basislinienverarbeitungsbericht für diese Basislinie erzeugen.

Zeile 2

Die Kennzeichnung Schrägstr kennzeichnet die zweite Zeile eines vierzeiligen Unterabschnitts. Hinter der Kennzeichnung ist die Schrägstrecke der GPS-Beobachtung angegeben. Im Anschluß daran folgt die Hochwert-Komponente der Koordinaten des aktuellen Zu-Punkts.

Zeile 3

Die Kennzeichnung Gesamt kennzeichnet die dritte Zeile eines vierzeiligen Unterabschnitts. Hinter der Kennzeichnung ist die bisher beim Erstellen der Schleife erzeugte Gesamtstrecke angegeben. Im Anschluß daran folgt die Rechtswert-Komponente der Koordinaten des aktuellen Zu-Punkts.

Zeile 4

Die letzte Zeile des Unterabschnitts hat keine Kennzeichnung. Sie enthält die orthometrische Höhe der Koordinaten des aktuellen Zu-Punkts.

HINWEIS: Die hier aufgeführten Hochwert-, Rechtswert- und Höhen-Koordinaten sind nicht die im Projekt enthaltenen Koordinaten. Die hier angezeigten Werte wurden durch Addition der GPS-Beobachtungen zu den Anfangskoordinaten der Von-Station abgeleitet. Diese Vektor-Addition wird um die Schleife fortgeführt. Am Ende der Schleife werden die auf diese Weise abgeleiteten Koordinaten von den Anfangskoordinaten des Von-Punkts subtrahiert, um den Abschlußfehler zu erzeugen.

Der letzte Standpunktunterabschnitt in dieser Tabelle ist die Von-Station, um anzuzeigen, daß die Schleife geschlossen wurde. Die letzten beiden Zeilen der Tabelle enthalten Informationen über den Abschlußfehler der Schleife.

Präzision

Dieses Feld zeigt den gesamten horizontalen und vertikalen Abschlußfehler an, angegeben in Teilen pro Million.

Fehler

Dieses Feld zeigt die von dieser Schleife erzeugten horizontalen und vertikalen Abschlußfehler an.


    Dialogfeld GPS-Schleifenschluß-Einstellungen

Weitere Informationen

 Wie kann ich ...

Verwenden Sie dieses Dialogfeld, um die Schleifenschluß-Optionen zu konfigurieren und die Abschnitte zu wählen, die im GPS-Schleifenschlußbericht enthalten sein sollen.

Führen Sie einen der folgenden Schritte aus, um das Dialogfeld Schleifenschluß-Einstellungen aufzurufen:

  Wählen Sie Berichte / Einstellungen / Bericht GPS-Schleifenschluß.

  Drücken Sie Alt+RES.

Das Dialogfeld Schleifenschluß-Einstellungen erscheint.

Folgende Steuerelemente und Gruppen sind enthalten:

Strecken in Schleife

Bearbeiten Sie dieses Feld, um die Anzahl der Beobachtungen festzulegen, die verwendet werden, um die Seiten der Schleife zu bilden. Die Voreinstellung ist 3. Wenn mehr als 3 Strecken angegeben sind, werden alle Schleifen mit dieser Anzahl Strecken oder weniger erzeugt. Beispiel: Wenn 5 angegeben ist, werden alle Schleifen mit entweder 5, 4 oder 3 Seiten im Bericht berücksichtigt.

Toleranzen

Bearbeiten Sie diese Felder, um den maximal akzeptablen Abschlußfehler zu definieren, der die für Ihr Projekt erforderlichen Genauigkeitsanforderungen erfüllt. Abschlußfehler, die diese Toleranzen überschreiten, werden als zurückgewiesene Schleifen im GPS-Schleifenschlußbericht ausgegeben. Die Toleranz kann entweder auf einer absoluten Strecke oder einem Verhältnis, angegeben in Teilen pro Million, basieren.

Wenn Absolut gewählt ist, werden die Felder Horizontal und Vertikal verfügbar. Geben Sie horizontale und vertikale Streckentoleranzen in diese Felder ein, um den maximal zulässigen Abschlußfehler festzulegen.

Wenn Verhältnis gewählt ist, wird das Feld PPM verfügbar. Geben Sie den maximal zulässigen Abschlußfehler in ppm ein. Wenn Verhältnis gewählt ist, werden die horizontalen und vertikalen Abschlußfehler kombiniert, bevor die Abschlußfehler-Toleranzprüfung ausgeführt wird.

Berichtabschnitte

Verwenden Sie die Kontrollkästchen in dieser Gruppe, um die Abschnitte auszuwählen, die im GPS-Schleifenschlußbericht erscheinen sollen. Die folgenden Abschnitte können eingeschlossen werden:

  Allgemeine Zusammenfassung

  Zurückgewiesene Schleifen

  Details zurückgewiesene Schleifen

  Beobachtungen in zurückgewiesenen Schleifen

  Besetzungen in zurückgewiesenen Schleifen

  Akzeptierte Schleifen

  Details akzeptierte Schleifen

Standardmäßig sind folgende Abschnitte enthalten:

  Allgemeine Zusammenfassung

  Zurückgewiesene Schleifen

  Beobachtungen in zurückgewiesenen Schleifen

  Besetzungen in zurückgewiesenen Schleifen

Jeder Abschnitt läßt sich durch Deaktivieren des Kontrollkästchens aus dem Bericht entfernen. Andere Abschnitte können durch Aktivieren der entsprechenden Kontrollkästchen in den Bericht aufgenommen werden.

Nur aktive Lösungen verwenden

Wählen Sie dieses Kontrollkästchen, wenn nur aktive Lösungen im Schleifenschlußbericht enthalten sein sollen.


    Befehl Bericht GPS-Schleifenschluß

Wie kann ich ...	Bericht

Verwenden Sie diesen Befehl, um eine Schleifenschluß-Analyse durchzuführen und die Ergebnisse in einem Berichtsformat anzusehen.

So können Sie den GPS-Schleifenschlußbericht ansehen:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster gewählt haben, erscheint das Dialogfeld GPS-Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die ausgewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der ganzen Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der GPS-Schleifenschlußbericht wird geladen.


GPS-Schleifenschlußbericht:Einstellungen
    GPS-Schleifenschlußbericht − Einstellungen

Weitere Informationen

Wie kann ich ...	Dialogfeld

Wählen Sie diesen Befehl, um die Abschnitte auszuwählen, die im GPS-Schleifenschlußbericht enthalten sein sollen.

Führen Sie einen der folgenden Schritte aus, um das Dialogfeld Schleifenschluß-Einstellungen aufzurufen:

  Wählen Sie Berichte / Einstellungen / Bericht GPS-Schleifenschluß.

  Drücken Sie Alt+RES.

Das Dialogfeld Schleifenschluß-Einstellungen erscheint.

HINWEIS: Einige Abschnitte erscheinen gemäß Voreinstellung, weitere Abschnitte können hinzugefügt werden. Sie können jede Kombination von Kontrollkästchen aktivieren oder deaktivieren, um den Inhalt des Berichts anzupassen.


Dialogfeld Schleifenschlußbericht

Verwenden Sie dieses Dialogfeld, um festzulegen, ob der Bericht auf der ganzen Datenbank oder auf ausgewählten Schleifen basieren soll.

So können Sie den GPS-Schleifenschlußbericht ansehen:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der GPS-Schleifenschlußbericht wird geladen.


Auf einen Schleifenschluß prüfen

Nach der Verarbeitung der Basislinien kann eine rote Warnkennzeichnung in der Vermessungsansicht erscheinen, die alle Basislinien markiert, die die Qualitätsakzeptanzkriterien nicht erfüllt haben. Basislinien mit einer Warnkennzeichnung können auch bei der Durchführung der Schleifenschluß-Analyse grobe Abschlußfehler verursachen.

Mögliche Fehlerursachen für große Abschlußfehler sind:

  Einrichten über dem falschen Vermessungspunkt.

  Eingabe falscher Antenneninformationen.

  Schlechte Verarbeitungsergebnisse.

So prüfen Sie auf einen Schleifenschluß:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Klicken Sie auf Zusammenfassung.

Der Abschnitt Zusammenfassung des GPS-Schleifenschlußberichts erscheint.


Den GPS-Schleifenschlußbericht einstellen

 Überblick und weitere Informationen

Abschnitte im GPS-Schleifenschlußbericht können aktiviert oder deaktiviert werden, um den Inhalt des Berichts zu bestimmen. Als Voreinstellung sind folgende Berichtabschnitte aktiviert:

  Zusammenfassung

  Zurückgewiesene Schleifen

  Beobachtungen in zurückgewiesenen Schleifen

  Besetzungen in zurückgewiesenen Schleifen

Die folgenden  Abschnitte können ebenfalls aktiviert werden:

  Details zurückgewiesene Schleifen

  Akzeptierte Schleifen

  Details akzeptierte Schleifen

So aktivieren oder deaktivieren Sie Berichtabschnitte:

1.	Führen Sie einen der folgenden Schritte aus, um den GPS-Schleifenschlußbericht anzusehen:

  Wählen Sie Berichte / Einstellungen / Bericht GPS-Schleifenschluß.

  Drücken Sie Alt+RES.

Das Dialogfeld Schleifenschluß-Einstellungen erscheint.

2.	Aktivieren oder deaktivieren Sie die entsprechenden Kontrollkästchen in der Gruppe Berichtabschnitte.


Die Zusammenfassung des GPS-Schleifenschlußberichts anzeigen

 Überblick und weitere Informationen

So können Sie die Zusammenfassung des Berichts anzeigen:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Klicken Sie auf Zusammenfassung.

Der Abschnitt Zusammenfassung erscheint.


Den GPS-Schleifenschlußbericht anzeigen

 Überblick und weitere Informationen

So greifen Sie auf den Bericht zu:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Verwenden Sie die Sprungmarken (Hyperlinks) des Inhalts, um zu den Abschnitten des Berichts zu springen und Daten zu untersuchen.


Die Kopfzeile des GPS-Schleifenschlußberichts anzeigen

 Überblick und weitere Informationen

So können Sie den Berichtskopf anzeigen:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Verwenden Sie die Bildlaufleisten, um die Daten zu untersuchen.


Die Statistik der akzeptierten Schleifen des GPS-Schleifenschlusses anzeigen

 Überblick und weitere Informationen

Der Abschnitt Akzeptierte Schleifen gibt an, welche Schleifen die Abschlußfehler-Toleranzprüfung bestanden haben. Dieser Berichtabschnitt erscheint nicht im Standardbericht. Sie können diesen Abschnitt durch Auswahl im Dialogfeld Schleifenschluß-Einstellungen in den Bericht aufnehmen.

So greifen Sie auf die Statistik der akzeptierten Schleifen zu:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Klicken Sie auf Akzeptierte Schleifen.

Der Abschnitt Akzeptierte Schleifen erscheint.


Die Details der akzeptierten Schleifen des GPS-Schleifenschlusses anzeigen

 Überblick und weitere Informationen

Der Abschnitt Details akzeptierte Schleifen enthält detailliertere Informationen über die Schleifen, die die Abschlußfehler-Toleranzprüfung bestanden haben. Dieser Berichtabschnitt erscheint nicht im Standardbericht. Sie können diesen durch Auswahl im Dialogfeld Schleifenschluß-Einstellungen in den Bericht aufnehmen.

So greifen Sie auf die Details der akzeptierten Schleifen zu:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Klicken Sie auf Details akzeptierte Schleifen. Der Abschnitt Details akzeptierte Schleifen erscheint.


Die Details der zurückgewiesenen Schleifen des GPS-Schleifenschlusses anzeigen

 Überblick und weitere Informationen

Der Abschnitt Details zurückgewiesene Schleifen enthält detailliertere Informationen über die Schleifen, die die Abschlußfehler-Toleranzprüfung nicht bestanden haben. Dieser Berichtabschnitt erscheint nicht im Standardbericht. Sie können diesen Abschnitt durch Auswahl im Dialogfeld Schleifenschluß-Einstellungen in den Bericht aufnehmen.

So greifen Sie auf die Details der zurückgewiesenen Schleifen zu:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

3.	Klicken Sie auf Details zurückgewiesene Schleifen.

Der Abschnitt Details zurückgewiesene Schleifen erscheint.


Die Statistik der Beobachtungen in zurückgewiesenen Schleifen anzeigen

 Überblick und weitere Informationen

Der Abschnitt Beobachtungen in zurückgewiesenen Schleifen hilft Ihnen, GPS-Basislinien zu identifizieren, die nicht in das Netz passen. Dies geschieht, indem alle zurückgewiesenen Schleifen untersucht werden, und die Basislinien angezeigt werden, die in mehreren zurückgewiesenen Schleifen gefunden wurden. Diese Liste wird so sortiert, daß die Basislinien, die in den meisten zurückgewiesenen Schleifen auftreten, oben aufgelistet sind. Der Abschnitt enthält auch eine Statistik der Basislinien-Zusammenfassung, die Ihnen helfen kann, schlechte Lösungen zu identifizieren.

So greifen Sie auf die Beobachtungen in zurückgewiesenen Schleifen zu:

1.	Führen Sie eine der folgenden Schritte aus, um den GPS-Schleifenschlußbericht anzuzeigen:

  Wählen Sie Berichte / Bericht GPS-Schleifenschluß.

  Drücken Sie Alt+RES.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

2.	Klicken Sie auf Beobachtungen in zurückgewiesenen Schleifen. Der Abschnitt Beobachtungen in zurückgewiesenen Schleifen erscheint.


Die Statistik der Besetzungen in zurückgewiesenen Schleifen ansehen
Die Statistik der Besetzungen in zurückgewiesenen Schleifen anzeigen

 Überblick und weitere Informationen

Der Abschnitt Besetzungen in zurückgewiesenen Schleifen hilft Ihnen, GPS-Standpunktbesetzungen für die Basislinien zu identifizieren, die nicht in das Netz passen. Diese Standpunktbesetzungen haben vielleicht Fehler bei der Standpunkteinrichtung. Alle zurückgewiesenen Schleifen werden untersucht. Die Basislinien, die in mehreren zurückgewiesenen Schleifen gefunden wurden und die Besetzungen für diese Basislinien werden angezeigt. Die Liste wird so sortiert, daß die Besetzungen, die in den meisten zurückgewiesenen Schleifen auftreten, oben aufgelistet sind.

So greifen Sie auf die Besetzungen in zurückgewiesenen Schleifen zu:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

Das voreingestellte HTML-Anzeigemodul Ihres Computers wird gestartet, nachdem die Schleifenschluß-Analyse beendet ist, und der Bericht erscheint mit der Kopfzeile am Berichtanfang.

3.	Klicken Sie auf Besetzungen in zurückgewiesenen Schleifen.

Der Abschnitt Besetzungen in zurückgewiesenen Schleifen erscheint.


Die Statistik der zurückgewiesenen Schleifen anzeigen

 Überblick und weitere Informationen

Die Statistik der zurückgewiesenen Schleifen zeigt an, warum die Strecken in einer Schleife von Basislinien nicht geschlossen wurden.

So greifen Sie auf die Statistik der zurückgewiesenen Schleifen zu:

1.	Wählen Sie Berichte / Bericht GPS-Schleifenschluß. Wenn Sie Beobachtungen im Graphikfenster ausgewählt haben, erscheint das Dialogfeld Schleifenschlußbericht.

2.	Wählen Sie eine der folgenden Optionen:

  Auswahl − führt einen Schleifenschluß für die gewählten Basislinien durch.

  Ganze Datenbank − führt einen Schleifenschluß basierend auf der gesamten Datenbank durch.

3.	Klicken Sie auf Zurückgewiesene Schleifen.

Der Abschnitt Zurückgewiesene Schleifen erscheint.


Die Eigenschaften der Basislinien-Warnkennzeichnungen anzeigen

 Überblick und weitere Informationen

Nach der Verarbeitung der Basislinien erscheinen rote Warnkennzeichnungen im Graphikfenster, um alle Basislinien zu markieren, die die Qualitätsakzeptanzkriterien nicht erfüllt haben.

So können Sie die Details einer Warnkennzeichnung ansehen:

1.	Wählen Sie eine Basislinie aus.

2.	Öffnen Sie das Eigenschaftsfenster (Klicken Sie mit der rechten Maustaste, um das Kontextmenü aufzurufen, und wählen Sie Eigenschaften).

Das Eigenschaftsfenster erscheint.

3.	Klicken Sie auf das Plus (+)-Symbol neben der Basislinie in der Auswahlliste im Eigenschaftsfenster.

Die Baumansicht in der Auswahlliste verzweigt sich und zeigt die ‘Von’- und ‘Zu’-Punkte für die Basislinie an. Eine rote Kennzeichnung zeigt eine Basislinie mit einem Verarbeitungsproblem an.

4.	Wählen Sie einen Punkt, der mit einer Warnkennzeichnung versehen wurde.

5.	Führen Sie einen der folgenden Schritte aus:

  Klicken Sie auf die Schaltfläche Warnkennzeichnungen.

  Wählen Sie im Menü Detaillierte Seite die Schaltfläche Warnung.

Eine Meldung zeigt an, warum die Basislinie gekennzeichnet wurde. Verwenden Sie diese Informationen, um das Problem zu lösen, das verhindert, daß die Basislinie die Akzeptanzkriterien erfüllt. Weitere Informationen finden Sie unter GPS-Verarbeitung - Datenanalyse.


Neuberechnung - Überblick
Neuberechnung − Überblick

Bei einer Neuberechnung wird die berechnete Position eines Punkts ermittelt.

Trimble Geomatics Office führt eine Neuberechnung für alle Daten durch, d. h. alle GPS-, konventionellen und Laser-Entfernungsmesser-Beobachtungen und eingegebenen oder importierten Koordinaten für einen Punkt. Diese Beobachtungen und eingegebenen Koordinaten werden bei der Neuberechnung bestimmt, um die Position für einen Punkt mit höchstmöglicher Qualität zu bestimmen.

Bei einer Neuberechnung wird/werden:

  die Position für im Feld gemessene Punkte bestimmt

  einem Punkt die geeignete Qualität zugeordnet

  Abschlußfehler in den Daten erfaßt und berichtet

  ein Neuberechnungsbericht erzeugt

Wenn ein Punkt über redundante Vermessungsdaten verfügt, enthält der Punktableitungsbericht die Beobachtung(en) oder eingegebenen Koordinaten, die zur Punktberechnung verwendet wurden. Der Neuberechnungsbericht enthält alle redundanten Beobachtungen, die außerhalb der Toleranz liegen. Toleranzen werden im Register Neu berechnen des Dialogfelds Projekteigenschaften definiert.

Eine Neuberechnung ist immer dann erforderlich, wenn Sie Daten zum Projekt hinzufügen oder bestehende Daten bearbeitet werden, z. B., wenn Sie die Antennenhöhe für eine GPS-Beobachtung ändern.

Trimble Geomatics Office führt eine Neuberechnung jedoch nicht automatisch durch. Wenn eine Neuberechnung erforderlich ist, erscheint das Neuberechnungssymbol [image] in der Statusleiste der Trimble Geomatics Office-Software.

Führen Sie einen der folgenden Schritte aus, um eine Neuberechnung durchzuführen:

  Wählen Sie Vermessung / Neu berechnen.

  Drücken Sie F4.

  Doppelklicken Sie in der Statusleiste auf das Neuberechnungssymbol (falls verfügbar).

  Klicken Sie auf die rechte Maustaste, um das Kontextmenü aufzurufen, und wählen Sie Neu berechnen.

HINWEIS: Sie können zu jeder Zeit eine Neuberechnung durchführen. Wenn jedoch nicht zuerst das Neuberechnungssymbol in der Statusleiste angezeigt wird, ändert sich nichts.

Bei einer Neuberechnung:

  werden keine Fehler verteilt

  haben eingegebene Koordinaten mit Festpunktqualität, Vermessungsqualität oder der Qualität Ausgeglichen Vorrang vor Beobachtungen.

HINWEIS: Der Begriff eingegebene Koordinaten bezieht sich auf Koordinaten für einen Punkt, die entweder mit Trimble Geomatics Office eingegeben oder aus einer Datei in das Trimble Geomatics Office-Projekt importiert wurden.


Neuberechnung - Wie die berechnete Position für beobachtete Punkte bestimmt wird
Neuberechnung − Wie die berechnete Position für beobachtete Punkte bestimmt wird

 Überblick und weitere Informationen

Das Flußdiagramm veranschaulicht, wie bei der Neuberechnung die Position für im Feld beobachtete Punkte berechnet wird:

HINWEIS: Bei der Berechnung der Position eines beobachteten Punkts werden bei der Neuberechnung keine deaktivierten Beobachtungen und keine deaktivierten eingegebenen Koordinaten verwendet. Es werden nur dann Beobachtungen oder eingegebene Koordinaten verwendet, die als Prüfpunkt aktiviert sind, wenn Punktpositionen im Projekt nicht mit irgendwelchen anderen Beobachtungen oder Koordinaten bestimmt werden können. Verwenden Sie das Eigenschaftsfenster, um Beobachtungen zu aktivieren und zu deaktivieren.

Die Kästen im Flußdiagramm beschreiben folgende Themen:

  Wie potentielle Startpunkte bei der Neuberechnung bestimmt werden

  Wie die Position für alle potentiellen Startpunkte bei der Neuberechnung bestimmt wird

  Neuberechnung − Wie die Komponentenqualitäten den aktuellen Startpunkt bestimmen

  Neuberechnung − Wie Beobachtungen vom aktuellen Startpunkt angewendet werden

  Neuberechnung  − Wie die Qualität beobachteter Punkte bestimmt wird


Neuberechnung - Wie potentielle Startpunkte bei der Neuberechnung bestimmt werden
Neuberechnung − Wie potentielle Startpunkte bei der Neuberechnung bestimmt werden

 Überblick und weitere Informationen

Eine Neuberechnung kann mit jedem Punkt beginnen, der die folgenden Eigenschaften hat:

  eingegebene Koordinaten und

  eine oder mehrere Beobachtungen müssen von dem Punkt durchgeführt worden sein

Beispiel: Die folgende Abbildung zeigt eine Echtzeit-kinematische (RTK)-Basis an. Dies ist ein potentieller Startpunkt.


Neuberechnung - Wie die Position für alle potentiellen Startpunkte bestimmt wird
Neuberechnung − Wie die Position für alle potentiellen Startpunkte bestimmt wird

 Überblick und weitere Informationen

Die Position des Startpunkts wird von den eingegebenen Koordinaten bestimmt. Ein potentieller Startpunkt hat normalerweise nur einen Satz eingegebener Koordinaten. Die Qualität jeder Positionskomponente (HoRe,h,ellh) wird von der Qualität der eingegebenen Koordinate übernommen. Wenn die ellipsoidische oder orthometrische Höhenkomponente nicht eingegeben wurde, dann wird das Geoidmodell verwendet, um die fehlende Komponente abzuleiten.

Ein Punkt kann mehr als einen Satz eingegebener Koordinaten haben, wenn Sie:

Koordinaten für einen Punkt eingeben und eine Ausgleichung durchführen (wenn das Netzausgleichungsmodul installiert ist), ohne den Punkt festzuhalten (dadurch wird ein ausgeglichener Satz Koordinaten für den Punkt erzeugt)

 WGS-84-Koordinaten und Gitternetz-Festpunkt-Koordinaten für einen Punkt importieren

  eine WGS-84 Koordinate und eine orthometrische Höhe importieren. Eine orthometrische Höhe wird als Teil einer Gitternetz-Koordinate gespeichert.

In diesem Fall verwendet die Neuberechnungsfunktion bestimmte Kriterien, um zu bestimmen, welche Koordinaten zur Positionsberechnung verwenden werden. Falls mit dem ersten Kriterium kein Koordinatensatz gefunden wird, wird das nächste Kriterium angewendet. Die Kriterien sind folgende (in absteigender Reihenfolge):

1.	Der Status (aktiviert/deaktiviert) der Koordinaten.

2.	Die Komponente mit der höchsten Qualität.

3.	WGS-84 Koordinaten haben Vorrang vor Gitternetz-Koordinaten.


Neuberechnung - Wie die Position für alle potentiellen Startpunkte bestimmt wird : (1) Der Status (aktiviert/deaktiviert) der Koordinaten
Neuberechnung – Wie die Position für alle potentiellen Startpunkte bestimmt wird: (1) Der Status der Koordinaten

 Siehe auch

Der Status (aktiviert/deaktiviert) der Koordinaten

Bei der Positionsberechnung eines Startpunkts werden nur aktivierte Koordinaten berücksichtigt. Prüfpunktkoordinaten werden nur zur Positionsberechnung von Startpunkten verwendet, wenn keine Beobachtungen zur Punktkoordinierung verwendet werden.

HINWEIS: Prüfpunktkoordinaten werden nur selten zur Koordinierung von Startpunkten verwendet.

Deaktivierte Koordinaten werden niemals berücksichtigt. Verwenden Sie das Eigenschaftsfenster oder das Dialogfeld Mehrfachbearbeitung, um Koordinaten zu aktivieren und zu deaktivieren.

Die Komponente mit der besten Qualität

Wenn es mehr als einen Satz Koordinaten gibt, werden bei der Neuberechnung die Komponenten mit der höchsten Qualität von allen verfügbaren eingegebenen Koordinaten für den Punkt verwendet. Die drei Komponenten sind:

  horizontal

  orthometrische Höhe

  ellipsoidische Höhe

HINWEIS: Diese Komponenten müssen nicht aus derselben Koordinatengruppe stammen.

Die folgende Tabelle enthält die Qualitäten der drei Komponenten und ordnet sie in absteigender Reihenfolge an. Diese Reihenfolge wird als ‘Qualitätshierarchie’ bezeichnet.

Im Eigenschaftsfenster erscheint das Symbol für die Qualität neben jeder Komponente.

Koordinatentyp

Wenn die beiden Koordinaten dieselbe Qualität haben, wird bei der Neuberechnung der Koordinatentyp berücksichtigt. WGS-84 Koordinaten haben Vorrang vor Gitter-/örtlichen Koordinaten.


Neuberechnung - Wie die Komponentenqualitäten den aktuellen Startpunkt bestimmen

 Überblick und weitere Informationen

Wenn es mehr als einen potentiellen Startpunkt gibt, wird bei der Neuberechnung der Punkt mit der höchsten Qualität als aktueller Startpunkt gewählt. Folgende Hierarchie wird verwendet:

1.	Festpunkt

2.	Ausgeglichen

3.	Vermessung

4.	Kartographie

5.	Unbekannte

Jede Komponentenqualität wird betrachtet. Wenn die Qualität für die Punktposition für jede Komponente unterschiedlich ist, wird die horizontale Qualität zuerst betrachtet, dann die ellipsoidische Höhe und danach die orthometrische Höhe.

Die folgende Tabelle zeigt einen Teil der Qualitätshierarchie an, die bestimmt, welcher der potentiellen Startpunkte zum aktuellen Startpunkt wird (die Qualitätshierarchie geht über den in der Tabelle gezeigten Umfang hinaus). Die grau unterlegten Zellen deuten Qualitäten an, die bei der Neuberechnung bevorzugt werden:

Beispiel: Ein Punkt kann die folgenden Komponentenqualitäten haben:

  Horizontale Qualität − Festpunkt

  Qualität der ellipsoidischen Höhe − Unbekannt

  Qualität der orthometrischen Höhe −  Unbekannt

Er wird als Startpunkt Vorrang vor einem Punkt mit den folgenden Komponentenqualitäten:

  Horizontale Qualität − Vermessung

  Qualität der ellipsoidischen Höhe − Vermessung

  Qualität der orthometrischen Höhe − Kartographie

Stellen Sie sicher, daß der Punkt, den Sie als Startpunkt oder als Punkt für die Koordinatenfortpflanzung verwenden möchten, Komponenten mit Festpunktqualität hat.

HINWEIS: Wenn es mehr als einen potentiellen Startpunkt mit denselben Qualitäten für alle Komponenten gibt, verwendet die Neuberechnungsfunktion den ersten Punkt im Projekt.


Neuberechnung - Wie Beobachtungen vom aktuellen Startpunkt angewendet werden
Neuberechnung − Wie Beobachtungen vom aktuellen Startpunkt angewendet werden

 Überblick und weitere Informationen

Bei der Neuberechnung wird eine Beobachtung von einem Startpunkt unterschiedlich angewendet, abhängig vom Beobachtungstyp. Es werden:

  GPS-Beobachtungen auf das WGS-84-Ellipsoid angewendet.

  konventionelle und Laser-Entfernungsmesser-Beobachtungen auf das örtliche Ellipsoid angewendet − wenn die Option Terrestrische Beobachtungen auf Ellipsoid reduzieren (NN-Korrektur) gewählt ist.

Diese Option befindet sich im Register Neu berechnen des Dialogfelds Projekteigenschaften. In diesem Fall werden bei der Neuberechnung die terrestrischen Beobachtungen auf Bodenhöhe angewendet. Weitere Informationen finden Sie unter dem Thema Meereshöhen-Korrektur. Wenn eine Ausgleichung durchgeführt wird, werden alle Strecken auf das Ellipsoid reduziert.

 Höhenunterschiede − werden bei einer anfänglichen Neuberechnung auf bestehende orthometrische Höhen angewendet.


Neuberechnung - Wie GPS-Beobachtungen angewendet werden
Neuberechnung − Wie GPS-Beobachtungen angewendet werden

 Überblick und weitere Informationen

GPS-Beobachtungen werden im Trimble Geomatics Office-Projekt als Boden-zu-Boden-Vektoren gespeichert. GPS-Vektoren werden jedoch im Feld von Antennenphasenzentrum zu Antennenphasenzentrum (APC-APC) beobachtet.

Beim Importieren konvertiert Trimble Geomatics Office die GPS-Vektoren in Boden-zu-Boden-Vektoren. Sie verwendet dazu die Antennenhöhen der GPS-Antennen an jedem Ende der Basislinie.  Wenn die Antennenhöhen bearbeitet werden, wird der Boden-zu-Boden-Vektor automatisch aktualisiert.

HINWEIS: Das Basislinienverarbeitungsprogramm erzeugt Boden-zu-Boden-Vektoren.

Bei der Neuberechnung werden die folgenden Vorgänge ausgeführt, um die Position der beobachteten GPS-Punkte zu bestimmen:

1.	Die Koordinaten des aktuellen Startpunkts werden in WGS-84 Breitengrad, Längengrad und Höhe (BLH) konvertiert.

2.	Diese Koordinaten werden in kartesische WGS-84 Koordinaten (X, Y, Z) konvertiert.

3.	Der Boden-zu-Boden-GPS-Vektor (Delta-X, Delta-Y und Delta-Z) wird auf die kartesischen WGS-84 Koordinaten des Startpunkts angewendet. Dadurch ergibt sich eine kartesische WGS-84-Position für den beobachteten Punkt.

HINWEIS: Der angewendete GPS-Vektor ist ein ausgeglichener Vektor, wenn Netzausgleichungsparameter im Projekt verwendet werden, auch wenn die Basislinie nicht in der Netzausgleichung verwendet wurde.

4.	Der beobachtete Punkt wird in WGS-84 Breitengrad, Längengrad und Höhe konvertiert.

5.	Das für das Projekt gewählte Koordinatensystem wird verwendet, um die Projektionskoordinaten für jeden Punkt aus seiner WGS-84-Position zu gewinnen. Es werden auch alle GPS-Kalibrierungen verwendet, die auf das Projekt angewendet wurden.

6.	Die ermittelte Koordinate wird als aktuelle Punktposition verwendet.


Neuberechnung - Richtung von GPS-Basislinien
Neuberechnung – Die Richtung von GPS-Basislinien

 Überblick und weitere Informationen

Gemäß Voreinstellung werden bei der Neuberechnung alle Echtzeit-kinematischen (RTK) GPS-Beobachtungen in der Richtung angewendet, in der die Basislinie beobachtet wurde (Basis zu Rover).

Die Richtung von nachverarbeiteten statischen und FastStatic Basislinien wird durch Fortpflanzung der Beobachtung bei der Basislinienverarbeitung bestimmt. Die Richtung wird im Projekt gespeichert, und ein Pfeil wird auf der Basislinie im Graphikfenster angezeigt. Der Fortpflanzungsalgorithmus gewährleistet, daß Basislinien vom Punkt mit der höchsten Qualität zum Punkt mit der niedrigsten Qualität verarbeitet werden. Bei der Neuberechnung wird die Basislinie in der Richtung angewendet, die im Projekt gespeichert ist.

Sie können die Richtung einer GPS-Basislinie ändern, damit bei der Neuberechnung der umgekehrte Beobachtungsfluß angewendet wird.

Wählen Sie hierzu die Beobachtung aus, und wählen Sie Bearbeiten / Beobachtungsfluß umkehren. Stellen Sie in diesem Fall sicher, daß der Punkt, von dem die Basislinie ausgehen soll, eine bekannte Position hat, z. B. eingegebene WGS-84 Breitengrad-, Längengrad- und Höhen-Koordinaten. Wenn der Punkt keine bekannte Position hat, wird die Beobachtung nicht angewendet.


Neuberechnung - Wie konventionelle und Laser-Entfernungsmesser-Beobachtungen angewendet werden
Neuberechnung − Wie konventionelle und Laser-Entfernungsmesser-Beobachtungen angewendet werden

 Überblick und weitere Informationen

Beim Importieren konventioneller Beobachtungen werden:

  vertikale Winkel auf Krümmung und Refraktion korrigiert

  Schrägstrecken auf atmosphärische Fehler korrigiert (PPM-Korrektur)

  horizontale Beobachtungen ausgehend vom Rückblick-Punkt in horizontale Winkel konvertiert.

Bei einer Neuberechnung werden bestimmte Vorgänge durchgeführt, um die Punktpositionen für konventionell oder mit Laser-Entfernungsmessern beobachtete Punkte zu bestimmen:

1.	Einer der folgenden Vorgänge wird durchgeführt:

  Wenn die Beobachtung eine Laser-Entfernungsmesser-Beobachtung ist, wird bei der Neuberechnung die magnetische Deklination auf den beobachteten Azimut angewendet.

  Wenn die Beobachtung eine konventionelle Beobachtung ist, wird bei der Neuberechnung die Prismen-Konstante auf die Schrägstrecke angewendet.

2.	Beobachtete Schrägstrecken werden auf horizontale Bodenstrecken reduziert.

3.	Wenn die Option Terrestrische Beobachtungen auf Ellipsoid reduzieren (NN-Korrektur) im Register Neu berechnen des Dialogfelds Projekteigenschaften gewählt ist, werden Bodenstrecken auf Ellipsoid-Strecken reduziert.

4.	Die Gerätehöhe wird zur örtlichen Höhe addiert.

5.	Das für das Projekt definierte Koordinatensystem wird verwendet, um den aktuellen Startpunkt in örtliche Breitengrad, Längengrad und ellipsoidische Höhe zu konvertieren (die Beobachtung wird entlang des Ellipsoids angewendet).

6.	Folgende Regeln werden zur Berechnung des Rückblick-Azimuts verwendet (nur für konventionelle Beobachtungen):

  Wenn die Position des Instrumentenpunkts und des Rückblick-Punkts bekannt ist (kein Azimut eingegeben wurde), wird bei der Neuberechnung der Rückblick-Azimut aus Richtungswinkel/Strecke zwischen den beiden Punkten verwendet.

  Wenn nur ein eingegebener Azimut zur Verfügung steht, und der "Zu"-Punkt keine Koordinate hat, wird dieser als Rückblick-Azimut verwendet.

  Wenn beide Positionen (die des Instrumenten- und des Rückblick-Punkts) bekannt sind, und ein eingegebener Azimut zur Verfügung steht, wird die Qualität jedes Azimuts bei der Neuberechnung bestimmt. Die Qualitätshierarchie in der nachstehenden Tabelle wird verwendet, um festzulegen, welcher Azimut als Rückblick-Azimut benutzt werden soll.

Wenn z. B. ein Vermessungsinstrument und ein Rückblick-Punktepaar sowie ein eingegebener Azimut mit Festpunktgüte existieren, wird der eingegebene Azimut als Rückblick-Azimut verwendet.

HINWEIS: Zur Berechnung des Rückblick-Azimuts wird die horizontale Qualität des Instrumentenpunkts und des Rückblick-Punkts geprüft, und der Punkt mit geringerer Qualität verwendet. Wenn der Instrumentenpunkt z. B. Festpunktgüte und der Rückblick-Punkt Kartographiegüte hat, wird dem Rückblick-Azimut Kartographiegüte zugewiesen.

Typ	Qualität
Aus Koordinaten abgeleitet	Festpunkt
Eingegebener Azimut	Festpunkt
Aus Koordinaten abgeleitet	Vermessung
Eingegebener Azimut	Vermessung
Aus Koordinaten abgeleitet	Kartographie
Eingegebener Azimut	Kartographie

HINWEIS: Wenn Sie möchten, daß bei der Neuberechnung der eingegebene Azimut anstelle des Azimuts zwischen dem Instrumenten- und dem Rückblick-Punkt verwendet wird, erhöhen Sie die Qualität der eingegebenen Azimut-Position. Sie muß in der Qualitätshierarchie eine besser Qualität haben als der Azimut, der zwischen dem Instrumenten- und dem Rückblick-Punkt berechnet wurde.

TIP: Die Qualität eines eingegebenen Azimuts kann bearbeitet werden.

7.	Der horizontale Winkel wird auf den Rückblick-Azimut angewendet, um den Gitternetz-Azimut zu bestimmen (nur für konventionelle Beobachtungen).

8.	Die magnetische Deklination wird auf den magnetischen Azimut angewendet, um den Gitternetz-Azimut zu bestimmen (nur für Laser).

9.	Die Beobachtung wird entlang des Ellipsoids angewendet, um den örtlichen Breiten- und Längengrad für den beobachteten Punkt zu bestimmen.

10.	Zur Bestimmung der Höhe des beobachteten Punkts, wird die Zielhöhe von der Instrumentenhöhe subtrahiert, um die Delta-Höhe zu ermitteln. Dann wird diese zur Höhe des Instrumentenstandpunktes addiert.

Das für das Projekt definierte Koordinatensystem wird verwendet, um die Koordinaten in örtliche Gitternetz-Koordinaten zu konvertieren.


Neuberechnung - Wie Höhenunterschiede angewendet werden
Neuberechnung − Wie Höhenunterschiede angewendet werden

Höhenunterschiede werden bei der Neuberechnung angewendet. Folgende Vorgänge werden bei einer Neuberechnung zur Bestimmung von Höhenunterschieden durchgeführt:

  die orthometrische Höhe des Startpunkts wird bestimmt.

  der Höhenunterschied wird auf den Startpunkt angewendet, um die orthometrische Höhe des neuen Punkts zu bestimmen.

Der Startpunkt muß eine eingegebene Höhe für Höhenunterschiede haben, von der der Beobachtungsfluß ausgehen kann.

Sie müssen am Beginn des Nivellements eine orthometrische Höhe eingeben, um sicherzustellen, daß Höhenunterschiede vom Beginn des Nivellements ausgehen können.

In nachstehendem Diagramm muß z. B. der Punkt A eine eingegebene Höhe haben, damit die Punkthöhen für B, C und D mit Hilfe der Höhenunterschied-Beobachtungen berechnet werden können. Selbst wenn eine Beobachtung zu A genügend Informationen für die Berechnung der orthometrischen Höhe bei A enthielte, würden trotz allem keine Höhenunterschiede berechnet (Ausnahme: wenn eine orthometrische Höhe eingegeben wurde).


Neuberechnung - Beispiel
Neuberechnung −Beispiel

 Überblick und weitere Informationen

Die folgende Abbildung ist ein Beispiel dafür, wie Koordinatenpunkte neu berechnet werden. Die Punkte A und I haben beide Festpunktqualität, die restlichen Punkte haben Vermessungsqualität.

Bei der Neuberechnung werden die Punkte A und I als potentielle Startpunkte ermittelt, da beide Punkte eingegebene Koordinaten haben und Beobachtungen von ihnen ausgehen. Die Punkte A und I haben dieselbe Qualität (Fest, B,L,h), daher wird bei der Neuberechnung der Punkt A als aktueller Startpunkt gewählt, da er zuerst in das Projekt eingegeben wurde.

Bei der Neuberechnung werden alle Beobachtungen vom Startpunkt verwendet, um die beobachteten Punkte zu koordinieren, bis es nicht mehr weiter geht. Deshalb sind die folgenden Punkte von Punkt A aus koordiniert: B, C, D, E, F, G und H.

Es gibt keine weiteren Beobachtungen vom aktuellen Startpunkt (Punkt A) aus, daher wird Punkt I bei der Neuberechnung als neuer Startpunkt gewählt. Die Neuberechnungsfunktion koordiniert die Punkte J, K und L vom Punkt I aus.

Es gibt Beobachtungen von Punkt I zu den Punkten D und H. Bei der Neuberechnung wurden diese Punkte bereits koordiniert, daher wird ein Abschluß für diese Punkte angezeigt. Wenn der Abschlußfehler größer ist, als die Toleranzeinstellungen im Register Neu berechnen des Dialogfelds Projekteigenschaften, erscheint im Graphikfenster eine Warnkennzeichnung auf dem beobachteten Punkt. Der Abschluß wird im Neuberechnungsbericht ausgegeben.

WARNUNG: Punkt D kann aus Beobachtungen von B und I abgeleitet werden. Die Beobachtung von B wird ungeachtet der Qualität dieser Beobachtungen verwendet. Dies geschieht, weil D zuerst von B koordiniert wird. Wenn Sie sicherstellen möchten, daß die Beobachtung von I verwendet wird, ändern Sie den Status der Beobachtung von B nach D auf "Als Prüfpunkt aktiviert".


Neuberechnung - Mehrfache Beobachtungen und Koordinaten für einen Punkt
Neuberechnung − Mehrfache Beobachtungen und Koordinaten für einen Punkt

 Überblick und weitere Informationen

Zu einem Punkt können mehrfache Beobachtungen durchgeführt worden sein, und er kann eingegebene Koordinaten haben. Wenn die Option Beste Beobachtung verwenden im Register Neu berechnen des Dialogfelds Projekteigenschaften gewählt ist, kann nur eine Beobachtung oder Koordinate zur Ableitung einer  Positionskomponente (HoRe,h,ellh) für den Punkt verwendet werden. Beispiel: Zu einem Punkt können zwei Beobachtungen durchgeführt worden sein, und er kann eine eingegebene Koordinate haben. Die eingegebene Koordinate wird zur Bestimmung der Punktkoordinate verwendet. Sie hat Vorrang vor der Beobachtung. Die anderen Beobachtungen oder eingegebenen Koordinaten, die bei der Neuberechnung nicht verwendet werden, sind im Neuberechnungsbericht enthalten.

HINWEIS: Wenn die Option Mittelwert aus demselben Beobachtungstyp berechnen (im Register Neu berechnen des Dialogfelds Projekteigenschaften) gewählt ist, können alle Beobachtungen zur Berechnung der Koordinatenkomponenten des Polarpunkts beitragen. Nur Polarpunkte werden gemittelt.

Mehrfache Beobachtungen zu einem Punkt

Zur Berechnung der Punktkoordinaten für einen Punkt mit mehrfachen Beobachtungen, wird bei der Neuberechnung die folgende Beobachtungshierarchie verwendet:

1.	Beobachtungsstatus (Aktiviert, Als Prüfpunkt aktiviert, Deaktiviert)

2.	Beobachtungsqualität

3.	Beobachtungstyp (GPS, konventionell, Laser, Reduziert)

4.	Genauigkeit

5.	Erste Beobachtung im Projekt


Neuberechnung - Mehrfache Beobachtungen zu Polarpunkten
Neuberechnung − Mehrfache Beobachtungen zu Polarpunkten

 Überblick und weitere Informationen

Wenn Beobachtungen (GPS oder konventionell) in Trimble Geomatics Office übertragen werden, bestimmt die Software, ob eine Beobachtung ein Polarpunkt ist. Ein Polarpunkt ist eine Beobachtung zu einem Punkt:

  von dem keine Beobachtung durchgeführt wurde

  zu dem keine statische oder FastStatic-Beobachtung durchgeführt wurde

  der kein Festpunkt ist

Die folgende Abbildung veranschaulicht, wie Polarpunkte in zwei unterschiedlichen Situationen auftreten können.

Die Einstellung in der Gruppe Mehrfache Polarpunkt-Beobachtungen (im Register Neu berechnen des Dialogfelds Projekteigenschaften) bestimmt, welche Beobachtungen verwendet werden, um die Position des Polarpunkts zu berechnen.

HINWEIS: Bei einer Neuberechnung werden keine Mittelwerte für orthometrische Höhen aus mehreren Polarpunkten berechnet.


Neuberechnung - Mehrfache Beobachtungen und Koordinaten mitteln
Neuberechnung − Mehrfache Beobachtungen und Koordinaten mitteln

 Überblick und weitere Informationen

Die Option Mittelwert aus demselben Beobachtungstyp berechnen im Register Neu berechnen des Dialogfelds Projekteigenschaften ist gemäß Voreinstellung nicht gewählt, daher werden mehrfache Beobachtungen nicht gemittelt.

Wenn Sie diese Option wählen, mittelt Trimble Geomatics Office die von jeder Beobachtung zu einem Polarpunkt berechneten Koordinaten.

HINWEIS: Wenn der Punkt ein Polygonzug-Punkt ist, wird bei der Neuberechnung nur eine Beobachtung oder Koordinate verwendet, um die Position des Punkts zu bestimmen.

Die Regeln zur Mittelung der Position für Polarpunkte sind:

  Bei der Neuberechnung wird nur derselbe Beobachtungstyp gemittelt. Beispiel: Eine GPS-Beobachtung kann nicht mit einer konventionellen Beobachtung gemittelt werden. In diesem Fall hat bei der Neuberechnung die GPS-Beobachtung Vorrang vor der konventionellen Beobachtung.

  Bei der Neuberechnung werden nur Koordinaten gemittelt, die aus Beobachtungen abgeleitet wurden. Beispiel: Wenn ein Punkt zwei Beobachtungen und eingegebene Koordinaten hat, werden bei der Neuberechnung die Beobachtungen gemittelt und die Koordinaten und Qualitäten bestimmt. Dann werden die eingegebenen Koordinaten und die gemittelten Koordinaten verglichen; die Koordinate mit der höchsten Qualität wird als Punktposition verwendet.

HINWEIS: Wenn eine oder mehrere Beobachtungen aktiviert sind, werden bei der Neuberechnung keine als Prüfpunkt aktivierten Beobachtungen zur Bestimmung des Positionsmittels verwendet.

Zur Positionsbestimmung des Punkts wird bei der Neuberechnung eine Berechnung von jeder Beobachtung zu dem Punkt durchgeführt. Jede Beobachtung wird entsprechend ihrer Genauigkeit gewichtet. Je höher die Genauigkeit, desto mehr Einfluß hat die Beobachtung auf die gemittelten Koordinatenwerte.

Bei der Neuberechnung von GPS-Beobachtungen wird das/die Feld(er) Genauigkeit verwendet. So können Sie dieses Feld ansehen:

1.	Wählen Sie eine GPS-Beobachtung aus.

2.	Öffnen Sie das Eigenschaftsfenster.

3.	Klicken Sie auf die Menüschaltfläche Beobachtungs-Statistiken [image].

Bei konventionellen Beobachtungen wird eine einheitliche Gewichtung verwendet.

Die Neuberechnungsfunktion verwendet die mittlere Position als Mittelpunkt eines Kreises mit einem durch die Toleranzstrecke definierten Radius. Diese Strecke ist im Register Neu berechnen des Dialogfelds Projekteigenschaften festgelegt. Wenn die Koordinatenkomponente horizontal ist (Hochwert, Rechtswert), verwendet die Neuberechnung die horizontale Toleranz. Wenn die Koordinatenkomponente vertikal ist (ellipsoidische oder orthometrische Höhe), wird die vertikale Toleranz verwendet.

Wenn sich Positionen außerhalb des durch die Toleranz definierten Kreises befinden, wird die am weitesten von der Mittelpunktposition entfernte Position zurückgewiesen, und der Vorgang wird wiederholt. In der folgenden Abbildung wurden drei konventionelle Beobachtungen zu dem Polarpunkt durchgeführt.

Beobachtung 3 befindet sich außerhalb des Toleranzkreises und wird deshalb beim nächsten Durchlauf weggelassen.

Der Vorgang wird mit den verbleibenden Beobachtungen wiederholt, bis sich alle berechneten Positionen innerhalb des Toleranzkreises befinden. Die folgende Abbildung veranschaulicht, wie die berechneten mittleren Gitternetz-Koordinaten die endgültigen berechneten Koordinaten des Punkts werden.

Alle Beobachtungen, die zur Koordinatenmittelung verwendet wurden, befinden sich nun innerhalb der spezifizierten Toleranz, daher werden die gemittelten Koordinaten bei der Neuberechnung als berechnete Position für den Punkt verwendet.

HINWEIS: Wenn Sie die Kontrollkästchen für die Toleranzprüfung im Register Neu berechnen des Dialogfelds Projekteigenschaften deaktivieren, werden alle Beobachtungen desselben Typs ohne Toleranzprüfung gemittelt. Folglich werden keine Ausreißer entdeckt.


Neuberechnung - Mehrfache Beobachtungen zu Polygonzug-Punkten
Neuberechnung − Mehrfache Beobachtungen zu Polygonzug-Punkten

 Überblick und weitere Informationen

In einem Vermessungspolygonzug, kann mehr als eine Beobachtung zu einem Polygonzug-Punkt durchgeführt werden. Dies wird mehrfache Beobachtung genannt.

Mehrfache Beobachtungen zu Polygonzug-Punkten sind nicht gemittelt. Dies wird in der folgenden Abbildung dargestellt. Zu Punkt 1 wurden zwei Beobachtungen durchgeführt, und eine Beobachtung ging von diesem Punkt aus. Die Beobachtung, die zur Ableitung der Position von Punkt 1 verwendet wird, ist die erste Beobachtung, die zur Bestimmung der Punktposition verwendet wird.


Neuberechnung - Punkte mit eingegebenen Koordinaten und Beobachtungen
Neuberechnung − Punkte mit eingegebenen Koordinaten und Beobachtungen

 Überblick und weitere Informationen

Die angezeigte Position für einen Punkt kann abgeleitet worden sein aus:

  Beobachtung(en)

  eingegebene(n) Koordinate(n), z. B. importierten Gitternetz-Koordinaten

Wenn ein Punkt eingegebene Koordinaten hat, und Beobachtungen zu diesem Punkt durchgeführt wurden, verwendet die Neuberechnung die Qualität der eingegebenen Koordinate(n) und Beobachtung(en), um die Position für den Punkt zu bestimmen. Wenn die Qualitäten gleich sind, haben die eingegebenen Koordinaten Vorrang vor den Koordinaten aus der/(den) Beobachtung(en). Wenn Sie also Beobachtungskoordinaten für die Position eines Punktes verwenden möchten,  stellen Sie sicher, daß die Beobachtung eine bessere Qualität hat als die eingegebenen Koordinaten für den Punkt.

Bei der Neuberechnung werden die horizontale und die vertikale Komponentenqualität getrennt betrachtet. Beispiel: Importierte Gitternetz-Koodinaten für einen Punkt können eine horizontale Komponente (Hochwert, Rechtswert) mit Vermessungsqualität und eine orthometrische Höhen-Komponente mit Kartographiequalität haben. Es gibt außerdem eine Beobachtung zu dem Punkt. Die aus der Beobachtung abgeleiteten horizontalen und vertikalen Koordinaten haben Vermessungsqualität.

Dies ist der folgenden Tabelle zusammengefaßt:

Die grau unterlegten Zellen zeigen, wie die Position für den Punkt bestimmt wird. Die horizontalen Komponentenqualitäten sind gleich, daher werden bei der Neuberechnung die Koordinaten anstelle der Beobachtung verwendet. Die Qualität der importierten vertikalen Koordinatenkomponente ist geringer als die der Beobachtung, daher wird die orthometrische Höhe bei der Neuberechnung aus der Beobachtung abgeleitet.

Die beste ellipsoidische oder orthometrische Höhe für Punkte wird abgeleitet, wenn alle verfügbaren eingegebenen Koordinaten und Beobachtungen zu dem Punkt verwendet werden. Wird bei der Neuberechnung eine Beobachtung zur Ableitung einer ellipsoidischen oder orthometrischen Höhe für den Punkt zu verwendet, dann werden die restlichen vertikalen Komponenten berechnet aus:

  dem Geoidmodell und/oder der vertikalen Ausgleichung

  eingegebenen Koordinaten

Wenn für das Projekt ein Geoidmodell verwendet wird, wird die im Register Neu berechnen des Dialogfelds Projekteigenschaften festgelegte Qualität des Geoidmodells verwendet, um die Qualität der aus diesem Geoidmodell abgeleiteten ellipsoidischen oder orthometrischen Höhe zu bestimmen. Diese Qualität wird mit allen eingegebenen Koordinaten verglichen. Die ellipsoidische oder orthometrische Höhe mit der besten Qualität wird verwendet.

HINWEIS: Wenn eine vertikale Ausgleichung aus einer Kalibrierung in der Definition des Projekt-Koordinatensystems existiert, dann haben die ellipsoidische oder orthometrische Höhe Vermessungsqualität.


Neuberechnung - Wie die Qualität beobachteter Punkte bestimmt wird
Neuberechnung − Wie die Qualität beobachteter Punkte bestimmt wird

 Überblick und weitere Informationen

Bei der Neuberechnung wird die Qualität eines beobachteten Punkts anhand der Qualität des Punktes bestimmt, von dem der Beobachtungsfluß ausging sowie aus der zur Punktbestimmung verwendeten Beobachtungsqualität. Die horizontalen und vertikalen Komponenten werden getrennt betrachtet.

Die Qualitätshierarchie der Qualität ist:

1.	Festpunkt

2.	Vermessung

3.	Kartographie

4.	Unbekannt

Die folgende Tabelle veranschaulicht, wie Beobachtungsqualitäten vom Lösungstyp oder Meßtyp bestimmt werden.

Beobachtungstyp	Der Beobachtung zugewiesene Qualität
GPS Fixed	Vermessung
GPS Float	Kartographie
GPS Autonom	Unbekannt
Konventionell	Vermessung
Laser-Entfernungsmesser	Kartographie
Höhenunterschied	Vermessung

Die Qualität, die einem Punkt für jede Komponente (horizontal, ellipsoidische oder orthometrische Höhe) zugewiesen wird, ist geringer als:

  die Qualität für den Punkt, von dem die Beobachtung durchgeführt wurde

  die Qualität der Beobachtung


Autonome Basis-Position für Echtzeit-kinematische Vermessungen
Autonome Basis-Position für Echtzeit kinematische Vermessungen

 Überblick und weitere Informationen

Wenn Sie die [image] -Taste in Trimble Survey Controller verwenden, um eine Echtzeit-kinematische (RTK)-Basis zu starten, und die Survey Controller (.dc)-Datei zu Trimble Geomatics Office zu übertragen, hat die Basis-Position (und damit alle Rover-Punkte von der Basis) die Qualität Unbekannt (für alle Komponenten: horizontal, ellipsoidische und orthometrische Höhe).

Wenn Sie Trimble Geomatics Office verwenden, um eine GPS-Kalibrierung durchzuführen, werden die Qualitäten der horizontalen und Höhen-Komponenten nicht geändert.

Wenn Sie zuversichtlich sind, daß sich durch die GPS-Kalibrierung die Qualität der Punkte verbessert hat, verwenden Sie das Eigenschaftsfenster, um die Qualität des Basis-Punkts zu ändern. Wird die Qualität der Basis-Position erhöht, verbessert sich die Qualität der Rover-Punkte.

HINWEIS: Die orthometrische Höhe hat Vermessungsqualität, wenn in der Definition des Projekt-Koordinatensystems eine vertikale Ausgleichung existiert.


Neuberechnung - Punkte, die mit Trimble Geomatics Office verschoben oder ausgeglichen wurden
Neuberechnung − Punkte, die mit Trimble Geomatics Office verschoben oder ausgeglichen wurden

 Überblick und weitere Informationen

Bei der Neuberechnung werden keine Punkte bewegt, die auf folgende Arten verschoben wurden:

  durch Verschieben einer Koordinate

  durch eine Koordinatentransformation

  durch eine Höhenausgleichung

  durch eine Netzausgleichung.

Wenn einer dieser Vorgänge auf einen Punkt angewendet wird, werden die Positionen, die aus Beobachtungen zu diesem Punkt abgeleitet wurden, nicht verwendet.


Neuberechnung - Die ellipsoidische Höhe des Projekts
Neuberechnung – Die ellipsoidische Höhe des Projekts

 Überblick und weitere Informationen

Die (ellipsoidische) Projekthöhe ist eine projektweite Einstellung, die als ungefähre Höhe für alle Punkte ohne ellipsoidische Höhen verwendet wird. Nicht alle Punkte ohne Höhen werden mit dem Wert für die Projekthöhe aktualisiert.

Sie wird nur verwendet, um Koordinaten vom WGS-84- in das Projekt-Koordinatensystem zu konvertieren, wenn:

  das Koordinatensystem des Projekts geändert wird, und es Null-Höhen gibt

  NN-Korrekturen angewendet werden, weil es keine Punkthöhen gibt

Das Feld Ellips. Höhe des Projekts befindet sich im Register Koordinatensystem des Dialogfelds Projekteigenschaften.


Neuberechnung - Prüfbeobachtungen
Neuberechnung − Prüfbeobachtungen

 Überblick und weitere Informationen

Mit Trimble Survey Controller können Sie Prüfbeobachtungen zu Punkten speichern. Im folgenden wird beschrieben, wie diese Punkte gehandhabt werden, wenn eine .dc-Datei in Trimble Geomatics Office importiert wird.

Prüfpunkte zu Punkten, die keine eingegebenen Festpunkte sind

Wenn die .dc-Datei importiert wird, wird die berechnete Position für den hinzugefügten Punkt aus der/(den) aktivierten Beobachtung(en) zu dem Punkt abgeleitet. Die Prüfbeobachtung wird importiert, aber nur dann zur Bestimmung der Punktposition verwendet, wenn es keine Beobachtungen zu dem Punkt mit Status Aktiviert gibt (bei der  Neuberechnung haben aktivierte Beobachtungen immer Vorrang vor als Prüfpunkt aktivierten Beobachtungen). Die Beobachtung erhält den Staus Als Prüfpunkt aktiviert und wird als gepunktete Linie im Graphikfenster dargestellt. Um den Status einer Beobachtung anzusehen und zu bearbeiten, verwenden Sie die Seite Zusammenfassung des Eigenschaftsfensters. Ein Abschlußfehler zwischen der berechneten Punktposition und den von der Prüfbeobachtung bestimmten Koordinaten wird berechnet. Dies wird im Neuberechnungsbericht ausgegeben, der beim Importieren erzeugt und im Ordner Recompute im Berichts-Ordner (Reports) des Projekts abgelegt wird.

HINWEIS: Wenn Sie eine Prüfbeobachtung zu einem gespeicherten Punkt speichern, dann den zuvor aufgezeichneten Punkt löschen, wird die Prüfbeobachtung importiert und ein neuer Punkt hinzugefügt. Der Status der Beobachtung bleibt Als Prüfpunkt aktiviert, und die berechnete Position für den Punkt wird aus der Beobachtung abgeleitet.


Trimble 3600/5600 GDM - Überblick
Trimble 3600/5600 GDM − Überblick

Sie können Daten zwischen Trimble Geomatics Office und einer Trimble 3600/5600 GDM-Kontrolleinheit an einem Trimble 3600/5600-Instrument übertragen. Trimble empfiehlt, Daten zu einem Instrument mit Firmware 632.11.00 oder höher zu übertragen.

Sie können Daten aus 3600/5600 GDM-Projektdateien (*.job) und Area-Dateien (*.are) importieren und Daten aus dem aktuellen Trimble Geomatics Office-Projekt in eine Area-Datei exportieren. Alternativ dazu können Sie Daten mit der Import-/Exportoption Vermessungsgeräte direkt importieren oder exportieren.

Die folgende Tabelle enthält die Dateitypen, die Sie zwischen Trimble Geomatics Office und einer Trimble 3600/5600 GDM-Kontrolleinheit übertragen können:

Importieren	Exportieren
.job − Daten, die mit der Trimble 3600/5600 GDM-Kontrolleinheit erfaßt wurden	Keine
.are − Koordinatendateien	.are
Keine	.pco − zur Trimble 3600/5600 GDM-Kontrolleinheit
Keine	.uds − benutzerdefinierte Programme (User-Defined Sequence - UDS)
Führen Sie folgende Schritte aus, damit Trimble Geomatics Office die importierten 3600/5600 GDM-Dateien richtig lesen kann:

  	Vergewissern Sie sich, daß die Programm-Nr. in der Trimble 3600/5600 GDM-Kontrolleinheit eingeschaltet ist.

  	Konfigurieren Sie Programm 32, um anstelle der horizontalen und vertikalen Strecke eine Schrägstrecke zu speichern. Weitere Informationen finden Sie in der Dokumentation der Trimble 3600/5600 GDM-Kontrolleinheit.

  	Damit Beobachtungen aus den Programmen 23 und 24 in Trimble Geomatics Office angezeigt werden können, müssen die Trimble 3600/5600 GDM-Programmbenutzertabellen nach den Standarddatensätzen horizontale und vertikale Winkeldatensätze und Datensätze mit Schrägstrecken enthalten. Weitere Informationen über die Bearbeitung von Benutzertabellen finden Sie in der Dokumentation der Trimble 3600/5600 GDM-Kontrolleinheit.


Benutzerdefinierte Programme (UDS) - Überblick
Benutzerdefinierte Programme (UDS) − Überblick

Ein benutzerdefiniertes Programm (User-Definied Sequence - UDS) bestimmt, wie Vermessungsdaten im Feld mit der Trimble 3600/5600 GDM-Kontrolleinheit auf einem Trimble 3600/5600-Instrument erfaßt und gespeichert werden. Jedes Programm wird in einer User-Defined Sequence-Datei (*.uds) gespeichert.

UDS-Dateien sollten folgende Datensätze enthalten:

2	Instrumentenstandpunkt
3	Instrumentenhöhe	(Optional)
62	Rückblick-Punkt
21	Rückblick-Azimut
5	Punktname
6	Zielhöhe	(Optional)
4	Code	(Optional)
7	Horizontaler Winkel
8	Vertikaler Winkel
9	Schrägstrecke

Wenn Sie ein benutzerdefiniertes Programm im Feld verwenden möchten, übertragen Sie eine UDS-Datei mit dem Standalone Data Transfer-Dienstprogramm zur Trimble 3600/5600 GDM-Kontrolleinheit (Sie können dafür nicht das Dialogfeld Exportieren in Trimble Geomatics Office verwenden). Weitere Informationen finden Sie in der Data Transfer-Hilfe.

Übertragen Sie die Vermessungsdaten in Trimble Geomatics Office, nachdem Sie sie erfaßt und gespeichert haben.

HINWEIS: Auf der Trimble Geomatics Office-CD sind vordefinierte UDS-Dateien enthalten.

Siehe auch


Pcode-Dateien (*.pco)

Pcode-Dateien enthalten numerische Codes und alphanumerische Beschreibungen, die Merkmale und Attribute definieren. Sie werden in einer Trimble 3600/5600 GDM-Kontrolleinheit mit einem Trimble 3600/5600-Instrument verwendet. Sie können die Codes während der Datenerfassung im Feld zur schnellen und einfachen Definition beobachteter Punkte eingeben. Wenn z. B. eine Pcode-Datei einen Code “201” und die Beschreibung “Baum” enthält, können Sie im Feld “201” eingeben, dann wird die Beschreibung “Baum” im Display der Kontrolleinheit angezeigt.

Eine Pcode-Datei, die zu einer Trimble 3600/5600 GDM-Kontrolleinheit exportiert wird, muß folgendes aufweisen:

  Numerische Codes mit einer Zahl unter 256

  Beschreibungen, die insgesamt weniger als 800 Zeichen aufweisen

Wenn Sie eine Pcode-Datei verwenden möchten, erstellen Sie sie aus einer Merkmals- und Attributbibliothek mit Trimbles Feature and Attribute Editor-Programm, und übertragen Sie sie zur Kontrolleinheit.

Siehe auch


Area-Dateien (*.are)

Trimble Geomatics Office unterstützt Area-Dateien (*.are).aus einer Trimble 3600/5600 GDM-Kontrolleinheit

Weitere Informationen finden Sie unter:

  Eine Trimble 3600/5600 GDM-Datei importieren

  Eine Datei im Trimble 3600/5600 GDM-Format exportieren


Projektdateien (*.job)

Trimble Geomatics Office unterstützt Projektdateien (*.job) von einer Trimble 3600/5600 GDM-Kontrolleinheit.

Weitere Informationen finden Sie unter Eine Trimble 3600/5600 GDM-Datei importieren