Copyright: ©1997 - 2002 Trimble Navigation Limited. All rights reserved.
Citation: ©1997 - 2002 Trimble Navigation Limited. All rights reserved.


Willkommen
Willkommen bei Trimbles RoadLink™-Dienstprogramm.

Das RoadLink-Dienstprogramm ist ein leistungsstarkes Interface zwischen Kurvenbanddefinitionen anderer Herkunft und Trimble-Vermessungsgeräten.

Verwenden Sie es, um:

 Kurvenbanddefinitionen zu importieren oder einzugeben

 Kurvenbanddefinitionen graphisch anzusehen

 Kurvenbanddefinitionen zu bearbeiten

Sie können danach die Kurvenbanddefinition auf ein Trimble-Vermessungsgerät zur Verwendung bei der Absteckung übertragen.

RoadLink bietet zwei Methoden für die Übertragung von Kurvenbanddefinitionen:

 Eine automatische Umwandlung horizontaler und vertikaler Kurvenbänder und Querprofile aus Entwurfsprogrammen anderer Herkunft

 Eine manuelle Eingabe der vollständigen Kurvenbanddefinition, der horizontalen und vertikalen Kurvenbänder, der Regelquerschnitte und der Überhöhung

Als integraler Bestandteil der Trimble Geomatics Office™-Software führt RoadLink zudem Abtrags- und Auftragsberechnungen für Erdbaumassen zwischen der Kurvenbanddefinition und einem in Trimbles DTMLink™-Dienstprogramm definierten Höhenlinienmodell durch.

Wir setzen voraus, daß Sie mit den Bedienungsgrundlagen von Microsoft Windows vertraut sind. Schauen Sie bitte in Ihrer Windows-Dokumentation nach, wenn Sie sich nicht sicher sind, wie die Windows-Software zu benutzen ist.

Wir hoffen, daß Ihnen die Verwendung dieses Produktes zusagt.


Felder Gefälle

 Siehe auch

Verwenden Sie die Felder Gefälle, um Gefällewerte anzuzeigen und einzugeben. Gefälle-Felder zeigen Gefällewerte in Prozentsatz- oder Verhältnisformaten an und akzeptieren Werte, die eines dieser Formate vorweisen.

Ein Gefälle-Feld nimmt z. B. den Wert 12,5 als 12,5% Gefälle an. Wenn Sie 1:20 als Gefälle-Verhältnis eingeben, wird dieses als 1 zu 20 angezeigt.

HINWEIS: Nachdem ein Regelquerschnitt gespeichert wurde, werden die Anzeige und die Berichte über Querneigungs- und Seitengefällewerte durch die Felder Gefälleformat und Seitengefälleformat in der Trimble Geomatics Office™-Software gesteuert.

Verwenden Sie das Register Einheiten und Format unter Datei / Projekteigenschaften, um das Gefälle- und Seitengefälleformat einzustellen.


Elemente

Die Elemente, die Sie für die verschiedenen Elementtypen angeben können, sind folgende:

Punkt

Linie

Bogen

Spirale

Um auf den Elementtyp zuzugreifen, heben Sie das Feld Element hervor, und treffen Sie eine Auswahl aus der Liste.


Punkt

Der Punktelementtyp wird durch Werte für den Hochwert und Rechtswert definiert.

Geben Sie die Werte für den Hochwert und Rechtswert des Punktelements in die Felder Hochwert und Rechtswert ein. Geben Sie die Werte ein, oder wählen Sie eine Position im Bildschirm mit der graphischen Auswahl.


Linie

Der Linienelementtyp wird durch Azimut und Länge definiert.

Das angegebene Linienelement wird dem Ende des vorherigen Elements hinzugefügt.

Geben Sie den Azimut des Linienelements in das Feld Azimut und die Länge des Linienelements in das Feld Länge ein.

Der auf dem Bildschirm dargestellte Azimut einer bestehenden Linie oder der Azimut zwischen zwei Positionen kann unter Verwendung der graphischen Auswahl gewählt werden, oder Sie können den Azimutwert über die Tastatur eingeben.

Heben Sie das Feld Azimut hervor, betätigen Sie dann Löschen und danach Tab, um zum nächsten Feld zu gelangen und einen Nullwert in das Feld Azimut einzugeben. Der für die Linie verwendete Azimut ist der berechnete Azimut, der eine Tangentenbeziehung zum vorhergehenden Element herstellt.

Das Feld zeigt <berechn.> an, um darauf hinzuweisen, daß der Wert von der Tangente am Ende des vorherigen Elements bestimmt wird.

Wenn Sie den tatsächlichen Azimutwert ermitteln möchten, durchsuchen Sie das auf dem Bildschirm angezeigte Linienelement.

HINWEIS: Klicken Sie auf Anwenden, um die Linie anzuwenden. Die Felder Hochwert und Rechtswert werden mit den Koordinaten für das Ende der Linie aktualisiert. Das Stationsfeld wird mit dem Stationswert am Ende der Linie aktualisiert. Verwenden Sie diese Felder, um die Eingabe zu bestätigen.


Bogen

Der Bogenelementtyp wird durch Radius und Länge oder Radius und Delta definiert.

Sie können Bogenelemente, die in verschiedenen Richtungen definiert sind, nicht durch ein einzelnes Spiralenelement verbinden. Sie können jedoch zwei Spiralenelemente verwenden, die durch ein Linienelement der Länge Null mit einem berechneten Azimut getrennt sind.

Geben Sie den Radius des Bogenelements in das Feld Radius und die Länge des Bogenelements in das Feld Länge ein. Alternativ können Sie auch den Radius des Bogenelements im Radiusfeld und den Delta-Winkel im Feld D. Winkel eingeben.

Das Vorzeichen des Radiuswertes definiert die Richtung des Bogens. Geben Sie einen negativen Wert für den Radius ein, wenn der Bogen nach links verläuft (vom Trassenbeginn aus gesehen). Geben Sie einen positiven Radiuswert ein, wenn der Bogen nach rechts verläuft.

Wenn Sie eine ganze Spirale | Spirale (SS)-Kurve definieren möchten, legen Sie einen Bogen mit dem erforderlichen Radius und einer Länge von Null zwischen zwei Spiralenelementen entsprechender Länge fest.

HINWEIS: Sie können die Bogenmethode mit Hilfe der Bogeneingabefelder auswählen.

HINWEIS: Klicken Sie auf Anwenden, um den Bogen anzuwenden. Die Felder Hochwert und Rechtswert werden mit den Koordinaten für das Ende des Bogens aktualisiert. Das Stationsfeld wird mit den Stationswerten am Ende des Bogens aktualisiert. Verwenden Sie diese Felder, um die Eingabe zu bestätigen.


Spirale

Der Spiralenelementtyp wird durch seine Länge definiert.

Ein Bogenelement geht immer entweder dem Spiralenelement voraus oder folgt ihm. Die Spiralenelemente werden verwendet, um Spirale | Bogen | Spirale (SAS)-Kurven zwischen Linien- und Bogenelementen oder zwischen zwei Bogenelementen zu bilden.

Sie können Bogenelemente, die in verschiedene Richtungen definiert sind, nicht durch ein einzelnes Spiralenelement verbinden. Sie können jedoch zwei Spiralenelemente verwenden, die durch ein Linienelement der Länge Null mit einem berechneten Azimut getrennt sind.

HINWEIS: Sie können zwei Bogenelemente, die unterschiedliche Radien aufweisen, durch ein Spiralenelement verbinden. Die zwei durch eine Spirale verbundenen Bogen müssen jedoch in derselben Richtung verlaufen. Das heißt, die verbundenen Bogen müssen beide nach rechts oder nach links verlaufen.

HINWEIS: Für eine Spirale, die zwei Bogen miteinander verbindet (eine sogenannte offene oder Verbundspirale) sind die Endkoordinaten der Spirale so lange inkorrekt, bis der zweite Bogen hinzugefügt wird. Dies trifft nur zu, wenn es sich bei der Verbundspirale um eine Ausgangsspirale handelt.

Wenn Sie eine ungültige Folge von Elementen angeben (z. B. zwei Spiralenelemente, die nicht durch ein Bogenelement getrennt sind), erscheint eine Fehlermeldung, wenn Sie auf Anwenden klicken, um die Achsendefinition auf dem Bildschirm zu aktualisieren.

HINWEIS: Klicken Sie auf Anwenden, um die Spirale anzuwenden. Die Felder Hochwert und Rechtswert werden mit den Koordinaten für das Ende der Spirale aktualisiert. Das Stationsfeld wird mit dem Stationswert am Ende der Spirale aktualisiert. Verwenden Sie diese Felder, um die Eingabe zu bestätigen.

HINWEIS: Wenn Sie das Dialogfeld Trasse / Horizontal schließen, werden spezielle Stationskennungen hinzugefügt.

Einfügen

Heben Sie das Feld Element hervor. Klicken Sie auf Einfügen, oder drücken Sie die Taste Einf, um Elemente einzufügen.

Löschen

Klicken Sie auf Löschen, um ein Element zu löschen. Klicken Sie auf Löschen, oder drücken Sie die Taste Entf, um das aktuell hervorgehobene Element zu löschen. Sie werden aufgefordert, zu bestätigen, daß Sie das hervorgehobene Element löschen möchten. Sie können zudem diese Option wählen, um alle Elemente zu löschen.

Anwenden

Klicken Sie auf Anwenden, um die von Ihnen vorgenommenen Änderungen und Bearbeitungen anzuwenden. Dieser Vorgang tritt unverzüglich in Kraft.

Berichte

Klicken Sie auf Berichte, um einen Bericht über das Kurvenband zu erstellen.

SPe bearbeiten

Klicken Sie auf SPe bearbeiten, um ein bestehendes Kurvenband oder einen bestehenden Kurvenbandabschnitt zu verschieben. Das Dialogfeld Schnittpunkt bearbeiten (SPe bearbeiten) erscheint.


Beispiel-Kurvenband

Der folgende Abschnitt erklärt, wie die Plazierung und der Übergang zwischen Regelquerschnitten verwendet wird, um die Kurvenbanddefinition zu steuern, siehe Abb. 1.

Abb. 1  Beispiel Kurvenband (Planansicht)

Rechte Trassenseite

Regelquerschnitt ‘A’ wird für die Stationen 0 – 20 Meter zugeordnet. Der Trassenübergang erfolgt von Regelquerschnitt A bei Station 20 m zu Regelquerschnitt B bei Station 70 m. Da bei Station 40 m auf der linken Trassenseite ebenfalls ein Regelquerschnitt zugeordnet werden muß, muß der rechten Trassenseite der System-Regelquerschnitt <Interpolieren> zugewiesen werden, damit eine korrekte Interpolation beibehalten werden kann. Um die Lücke zwischen den Stationen 70 - 90 m korrekt darzustellen, wird der System-Regelquerschnitt <Keine> in nomineller Entfernung hinter Station 70 (z. B. 70,005 m) zugewiesen. Zur Vervollständigung der rechten Trassenseite wird der Regelquerschnitt ‘B’ bei Station 90 – 150 m zugeordnet.

Linke Trassenseite

Regelquerschnitt ‘A’ wird bei Station 0 - 40 m zugewiesen. Der Trassenübergang erfolgt von Regelquerschnitt A bei Station 40 m zu Regelquerschnitt B bei Station 70 m. Um den Entwurf korrekt darzustellen, wird Regelquerschnitt ‘A’ in nomineller Entfernung hinter Station 120 m – 150 m (z. B. 120,005 m) zugeordnet.

Ordnen Sie die Regelquerschnitte den festgelegten Anfangsstationen (Beg. Station) zu, wie in nachfolgender Tabelle dargestellt:

Beg. Station	Linke Regelquerschnitte	Rechte Regelquerschnitte
0,000	Regelquerschnitt ‘A’	Regelquerschnitt ‘A’
20,000	Regelquerschnitt ‘A’	Regelquerschnitt ‘A’
40,000	Regelquerschnitt ‘A’	<Interpolieren>
70,000	Regelquerschnitt ‘B’	Regelquerschnitt ‘B’
70,005	Regelquerschnitt ‘B’	<Keine>
90,000	Regelquerschnitt ‘B’	Regelquerschnitt ‘B’
120,000	Regelquerschnitt ‘B’	Regelquerschnitt ‘B’
120,005	Regelquerschnitt ‘A’	Regelquerschnitt ‘B’
Regelquerschnittsinterpolation

Die beiden folgenden Fälle veranschaulichen die Methode der Regelquerschnittsinterpolation:

  beide Regelquerschnitte verfügen über die gleiche Anzahl an Soll-Linienelementen

  die Regelquerschnitte verfügen über eine ungleiche Anzahl an Soll-Linienelementen

Interpolieren zwischen Regelquerschnitten mit gleicher Anzahl an Soll-Linienelementen

Regelquerschnitte mit gleicher Anzahl an Soll-Linienelementen werden zum äquivalenten Element im nächsten Regelquerschnitt interpoliert, siehe Abb. 2.

Abb. 2 : Interpolieren zwischen Regelquerschnitten (Gleiche Anzahl an Soll-Linienelementen)

In Abb. 2 enthält der Regelquerschnitt bei Station 0+100 das erste Element mit einer Querneigung von –2% und einem Offset von 4,0 Metern. Dem nächsten Regelquerschnitt ist bei Station 0+400 zugewiesen, und er weist das erste Element mit einer Querneigung von –5% und einem Offset von 7 Metern auf. Das Querprofil für die Stationen 0+200 und 0+300 wird wie dargestellt interpoliert, um ein gleichmäßiges Gefälle von Station 0+100 zu Station 0+400 zu erreichen.

Interpolieren zwischen Regelquerschnitten, die eine unterschiedliche Anzahl an Soll-Linienelementen vorweisen

Bei Regelquerschnitten, die über eine ungleiche Anzahl an Soll-Linienelementen verfügen, werden dem Regelquerschnitt mit den wenigsten Elementen Elemente der Länge Null vor dem Seitengefälleelement hinzugefügt. Die Interpolation wird daraufhin durchgeführt, vorausgesetzt, daß eine gleiche Anzahl an Elementen existiert. Siehe Abb. 3, in der ein Element ‘3’ der Länge Null automatisch eingefügt wurde.

Abb. 3 : Interpolieren zwischen Regelquerschnitten (Unterschiedliche Anzahl an Soll-Linienelementen)

Sie können, um die Solltrasse am besten zu repräsentieren, den Interpolationsvorgang weitergehend steuern, indem Sie Regelquerschnittselemente der Länge Null hinzufügen.

HINWEIS: Wenn für die Entwurfsdefinition eine Lücke erforderlich ist, verwenden Sie <Keine> Regelquerschnitte.

HINWEIS: Zwischen einem Null-Regelquerschnitt und einem gültigen Regelquerschnitt tritt keine Interpolation auf.

HINWEIS: Regelquerschnitte werden interpoliert, nachdem die Überhöhung und Ausweitung angewendet wurden.

Interpolation von Seitengefällen

Wenn aufeinanderfolgende Regelquerschnitte Seitengefälle mit unterschiedlichen Werten enthalten, werden Seitengefälle von Zwischenstationen auf den Gefällewerten basierend interpoliert.

Wenn das Seitengefälle bei Station 0+600 z. B. 1:2 und bei Station 0+800 1:4 beträgt, wird der Seitengefällewert bei Station 700 1:3. betragen.


Dialogfeld VSPe bearbeiten

Verwenden Sie das Dialogfeld VSPe bearbeiten, um die Verschiebungsdimensionen bezogen auf die Höhe eines individuellen VSP oder eines Kurvenbandabschnittes anzugeben.

Bearbeiten mit

Wählen Sie die gewünschte Option aus der Gruppe Bearbeiten mit. Die verfügbaren Optionen sind Delta und Position.

Delta

Wählen Sie die Option Delta, um die Verschiebung der vertikalen Kurvenbandhöhe durch Delta festzulegen. Geben Sie den erforderlichen Wert in das Feld Höhenunterschied unterhalb der Gruppe ein.

Sie können einen kontinuierlichen sequentiellen Bereich von VSPe wählen, indem Sie einen individuellen VSP in der Tabelle hervorheben und mit der Maus ziehen, um das Kurvenband zu verschieben. Als Alternative halten Sie die Taste Umschalt gedrückt, und klicken auf den letzten VSP in dem gewünschten Bereich.

TIP: Setzen Sie das Feld Höhenunterschied als berechnetes Feld ein. Heben Sie dazu das Feld hervor, wählen Sie die aktuelle Position des VSP auf dem Bildschirm, und wählen Sie daraufhin die neue Position auf dem Bildschirm. RoadLink berechnet den Wert für den Höhenunterschied und zeigt ihn in diesem Feld an.

Position

Wählen Sie die Option Position, um die Verschiebung der vertikalen Kurvenbandstation und -höhe durch die Position festzulegen. Geben Sie die Werte in die Tabelle ein.

TIP: Über die Option Bearbeiten mit Position gelangen Sie automatisch in den Bearbeitungsmodus.

Anwenden

Klicken Sie auf Anwenden, um die neuen Werte anzuwenden.

HINWEISE:

Die RoadLink-Software zeigt ein farbiges Dreieckssymbol in einem Kästchen auf dem Bildschirm an, um auf die neuen Höhen der VSPe hinzuweisen, bevor die Höhen tatsächlich ausgeglichen werden. Die Dreieckssymbole werden zusätzlich zu den sich ebenfalls in Kästchen befindlichen, farbigen Kreuzsymbolen angezeigt, die ihrerseits die aktuelle Höhe der gewählten VSPe anzeigen.

Sie können Änderungen nur innerhalb des angegebenen Bereichs durchführen. Falls sich die Änderungen außerhalb des Bereichs befinden, stellt RoadLink die ursprünglichen Werte wieder her.


Ausschneiden, Kopieren, Einfügen
Bearbeiten / Ausschneiden, Kopieren, Einfügen

	Ausschneiden
	Kopieren
	Einfügen

Die Befehle “Ausschneiden”, “Kopieren” und “Einfügen” bieten sich an, um Text auf praktische Art zu verschieben oder zu kopieren.

“Verschieben” bedeutet, daß die Auswahl aus einem Feld entfernt (Ausschneiden) und in ein anderes Feld oder eine andere Software-Anwendung eingefügt (Einfügen) wird.

“Kopieren” bedeutet, daß eine Kopie (Kopieren) der Auswahl erstellt und in ein anderes Feld oder eine andere Software-Anwendung eingefügt (Einfügen) wird.

Die Zwischenablage ist der temporäre Zwischenspeicher für eine Textauswahl, wenn Sie diese verschieben oder kopieren.

Jedesmal, wenn Sie die Befehle “Ausschneiden” oder “Kopieren” verwenden, ersetzt die neue Auswahl den Inhalt in der Zwischenablage. Nachdem Sie die Auswahl in ein Projekt oder eine andere Software-Anwendung eingefügt haben, verbleibt die Kopie der Auswahl in der Zwischenablage. Sie können diese Auswahlkopie dann erneut einfügen, wenn Sie dies möchten.


Rückgängig
Bearbeiten / Rückgängig

	Verwenden Sie das Symbol “Rückgängig” auf der Standard-Symbolleiste
Verwenden Sie diesen Befehl, um den vorherigen Vorgang in einem beliebigen Feld rückgängig zu machen.

ACHTUNG: Wenn Sie auf Löschen klicken oder die Taste Entf drücken, können keine Vorgänge oder Arbeitsschritte durch den Befehl Rückgängig rückgängig gemacht werden.

Sie können mehr als einen Vorgang rückgängig machen.


Menü Bearbeiten
Menü "Bearbeiten"

Verwenden Sie das Menü “Bearbeiten”, um Projektdaten zu bearbeiten. Das Menü “Bearbeiten” verfügt über die folgenden Befehle:

Ausschneiden

Kopieren

Einfügen

Rückgängig


Neue Trasse
Datei / Neue Trasse

Verwenden Sie diesen Befehl, um eine neue Trasse zu erstellen.

Trassenbezeichnung

Die Trassenbezeichnung kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen. Wählen Sie den Befehl Datei / Trasse umbenennen, um eine bestehende Trasse umzubenennen.

Beginn Station

Geben Sie die Anfangsstation für die neue Trasse in dieses Feld ein.

Oberfläche

In der Oberflächenliste werden alle Oberflächen für das aktuelle Projekt angezeigt sowie alle aus anderen Projekten importierten Oberflächen. Wählen Sie die Oberfläche, die Sie mit der Trasse verknüpfen möchten, aus der Liste. Sie können dann Volumen für Erdarbeiten berechnen und die Oberfläche in der Plan-, Profil- oder Querprofilansicht ansehen.

Informationen zum Importieren einer Oberfläche aus einem anderen Projekt finden Sie unter Datei / Importieren − Register Oberfläche − Option Höhenlinienmodell.

HINWEIS: Wenn ein Höhenlinienmodell mit der Trasse verknüpft werden soll, müssen Sie die Oberfläche zuerst im DTMLink-Dienstprogramm erstellen (Oberflächen, die aus Software anderer Herkunft in DTMLink importiert wurden, stehen in RoadLink nicht zur Verfügung).

HINWEIS: Wählen Sie Trasse / Optionen, um die Anfangsstation, die Oberfläche und die Querprofilbreite des Urgeländes für eine bestehende Trasse zu ändern.

Klicken Sie auf OK. Das Dialogfeld Horizontal erscheint.

Klicken Sie auf Abbrechen, um das Dialogfeld Neue Trasse zu verlassen.


Trasse öffnen
Datei / Trasse öffnen

Verwenden Sie diesen Befehl, um eine bestehende Trasse für die Bearbeitung auszuwählen.

Trassenbezeichnung

Geben Sie die Bezeichnung der Trasse, die Sie bearbeiten möchten, in das Feld Trassenbezeichnung ein, oder wählen Sie eine Bezeichnung aus der Dropdown-Liste.


Trasse speichern
Datei / Trasse speichern

Verwenden Sie diesen Befehl, um die aktuelle Trasse zu speichern.

Das Projekt wird unter C:\Trimble Geomatics Office\Projekte\xx\…, gespeichert, wobei xx die Projektbezeichnung ist.


Trasse schließen
Datei / Trasse schließen

Verwenden Sie diesen Befehl, um eine geöffnete Trasse zu schließen.


Trasse speichern unter
Datei / Trasse speichern unter

Verwenden Sie diesen Befehl, um die aktuelle Trasse unter einer neuen Bezeichnung zu speichern.

Neue Trasse

Geben Sie eine neue Bezeichnung in das Feld Neue Trasse ein. Die Bezeichnung kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen.

HINWEIS: Wenn die Bezeichnung bereits existiert, werden Sie gefragt, ob Sie die bestehende Datei überschreiben möchten.

Dieser Befehl speichert alle Aspekte des Entwurfs:

  horizontale und vertikale Kurvenbänder

  Regelquerschnitte

  Überhöhung


Trasse löschen
Datei / Trasse löschen

Verwenden Sie diesen Befehl, um eine Trasse permanent zu löschen.

Trassenbezeichnung

Geben Sie die Bezeichnung in das Feld Trassenbezeichnung ein, oder wählen Sie sie aus der Liste. Die Trasse wird gelöscht, sobald Sie OK wählen.

ACHTUNG: Sie können eine Trasse nicht wiederherstellen (entlöschen), wenn Sie sie einmal gelöscht haben.


Trasse umbenennen
Datei / Trasse umbenennen

Verwenden Sie diesen Befehl, um die aktuelle Trasse umzubenennen.

Trassenbezeichnung

Geben Sie die neue Bezeichnung für die aktuelle Trasse ein. Die Trassenbezeichnung kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen.


Importieren
Datei / Importieren

	Klicken Sie auf das Symbol Importieren auf der Standard-Symbolleiste
Wenn Sie Datei / Importieren wählen, erscheint das Dialogfeld Importieren. Es besteht aus drei Registern: Trasse, Oberfläche und Hintergrund. In jedem Register werden die Dateitypen aufgelistet, die importiert werden können, wie nachstehend dargestellt:

Register	Dateien, die importiert werden können
Trasse	Kurvenbanddefinition-Datei anderer Herkunft  Kurvenbanddefinition von Trimble Survey Controller  Kurvenbanddefinition von Trimble Survey Controller-Datei  Kurvenbanddefinition von SDR33-Datei  ASCII-Kurvenbanddefinition-Datei (*.tdf)
Oberfläche	Höhenlinienmodell
Hintergrund	Hintergrundliniennetz von TerraModel-Projektdatei (*.pro)  Hintergrundliniennetz von AutoCAD-Zeichnungsdatei (*.dwg)  ASCII AutoCAD Drawing eXchange (DXF)-Datei  Bitmap-Bild


ASCII-Kurvenbanddefinition-Datei

 Siehe auch

Verwenden Sie diese Formatdefinition, um horizontale und vertikale Kurvenband-, Regelquerschnitts-, Überhöhungs- und Ausweitungs-Details aus einer ASCII-Datei zu importieren.

  Verwenden Sie die Befehle Trasse / Horizontal und Trasse / Vertikal, um das Kurvenband anzusehen oder zu bearbeiten.

  Verwenden Sie den Befehl Trasse / Regelquerschnitte, um Regelquerschnitte erneut zuzuordnen.

  Verwenden Sie den Befehl Trasse / Überhöhung, um die Überhöhungs- und Ausweitungs-Details zu bearbeiten.

  Verwenden Sie den Befehl Extras / Regelquerschnitt-Editor, um die Regelquerschnitte zu bearbeiten.

Kopfzeile

Die Kopfzeile enthält:

CLINE-DATEI V1.00	Voreinstellung

METERS	Streckeneinheiten

 DEGREES	Winkeleinheiten

START CHAINAGE,   X.XX	wobei X.XX der Wert der Anfangsstation ist

Horizontales Format

Das Format beginnt mit:

HORIZ.	Dies weist auf den Beginn der horizontalen Definition hin

RN, YY	wobei YY die Trassenbezeichnung ist

N,  ZZ	wobei ZZ die Kurvenbandbezeichnung ist

Das Format ermöglicht die Eingabe eines horizontalen Kurvenbands mit Hilfe von Punkten, Linien, Spiralen und Bögen.

Die Codes für diese Elemente sind:

PT für einen Punkt	Dies definiert die Koordinaten, die zuerst über einen Rechtswert verfügen müssen
R. für eine Linie	Dies definiert eine Länge und einen Azimut. Um den Azimut automatisch zu berechnen (wo zutreffend), geben Sie <berechn.> für den Azimutwert ein
CL für eine Spirale	Dies wird durch Länge, K-Faktor oder beides definiert. Die RoadLink-Software berechnet jeden fehlenden Wert mit der Formel: Wobei: A der K-Faktor ist R der Radius der nahegelegenen Kurve ist L die Länge der Spirale ist Einem Spiralenelement muß immer ein Bogenelement vorausgehen oder folgen.
CC für einen Bogen	Dies definiert den Bogen als Länge und Radius. Ein negativer Wert weist auf eine Linkskurve hin
Das Format für das horizontale Kurvenband ist in der folgenden Tabelle beschrieben:

Vertikales Format

Das Format muß beginnen mit:

VERT.	Dies weist auf den Beginn der vertikalen Definition hin

N,   XX	wobei XX die Kurvenbandbezeichnung ist. Diese muß mit der horizontalen Kurvenbandbezeichnung übereinstimmen

Das Format ermöglicht die Eingabe der folgenden Kurventypen zur Definition der vertikalen Kurvenbänder.

Die Kurventypen sind:

Symmetrische Parabel

Definiert als VSP (Vertikaler Schnittpunkt) und seine halbe Länge

Asymmetrische Parabel

Definiert als VSP und seine Eingangs- und Ausgangslänge (Länge Hinein und Länge Hinaus)

Kreisförmig	Definiert als VSP und der Radius des Bogens

Keine	Definiert als Station und Höhe

Das Format für das vertikale Kurvenband ist in der folgenden Tabelle beschrieben:

Regelquerschnittsformat

Mit diesem Format können Sie die Regelquerschnittsdefinitionen eingeben. Das Format muß beginnen mit:

TEMPLATE	Dies weist auf den Beginn der Regelquerschnittsdefinition hin

N,   XX	wobei XX die Regelquerschnittsbezeichnung ist

Regelquerschnitte werden durch die folgenden Werte definiert:

O	Dies definiert die Anfangskoordinate, die 0,00; 0,00 sein muß

D	Dies definiert Regelquerschnittselemente durch Delta-Offset und Höhe, wenn das Element durch eine Überhöhung und Ausweitung und einen Code angepasst wurde

G	Dies definiert einen Regelquerschnitt durch ein Offset und eine Querneigung, wenn das Element durch eine Überhöhung und Ausweitung und einen Code angepasst wurde

B	Dies definiert die Seitengefällewerte (Abtrag und Auftrag), die Grabenbreite und einen Code

Das Format für den Regelquerschnitt ist in der folgenden Tabelle beschrieben:

Stationsformat

Mit diesem Format können Sie die Station eingeben, der die Regelquerschnitte zugeordnet werden.

Das Format muß beginnen mit:

SECTION	Dies weist auf den Beginn des Profilformats hin. Das Format enthält die Station und die links und rechts der Mittellinie zugeordnete Regelquerschnittsbezeichnung.

Überhöhungsformat

Mit diesem Format können Sie die Überhöhungs- und Ausweitungswerte sowie die Drehpunktoption für die Stationswerte eingeben. Das Format beginnen mit:

SUPER	Dies weist auf den Beginn des Überhöhungsformats hin. Das Format enthält die Station, die linken und rechten Überhöhungs- und Ausweitungswerte und die Drehpunktoption.

HINWEISE:

Die Kopfzeilendetails müssen enthalten sein.

Die Eingabereihenfolge für jedes Element muß eingehalten werden.

Der Punkt (.) nach dem R muß enthalten sein.

Die horizontalen Kurvenbänder werden importiert und in Elementform in RoadLink angezeigt. Sie können das horizontale Kurvenband in SP-Form anzeigen, indem Sie das Register SP wählen.

Das Dateiformat enthält Kommas, um Eingaben voneinander zu trennen und um Felder anzuzeigen, die leer sind.

Wenn die Kurvenbanddefinition Regelquerschnitte enthält, wird eine neue Regelquerschnittsbibliothek erstellt. Alle mit der importierten Trasse verknüpften Regelquerschnitte werden in dieser Bibliothek gespeichert. Die Bibliotheksbezeichnung entspricht der Trassenbezeichnung.


Kuvenbanddefinition von Trimble Survey Controller
Kurvenbanddefinition von Trimble Survey Controller

 Siehe auch

Verwenden Sie diese Option, um horizontale und vertikale Kurvenbänder, Regelquerschnitte und Überhöhungs- und Ausweitungswerte von einem Trimble Survey Controller zu importieren.

Wählen Sie die Datei vom entsprechenden Gerät.

HINWEIS: Wenn die Kurvenbanddefinition Regelquerschnitte enthält, wird eine neue Regelquerschnittsbibliothek erstellt. Alle mit der importierten Trasse verknüpften Regelquerschnitte werden in dieser Bibliothek gespeichert. Die Bibliotheksbezeichnung entspricht der Trassenbezeichnung.


Kurvenbanddefinition von Trimble Survey Controller-Datei

 Siehe auch

Verwenden Sie diese Option, um horizontale und vertikale Kurvenbänder, Regelquerschnitte und Überhöhungs- und Ausweitungswerte aus einer Trimble Survey Controller-Datei zu importieren.

Dateiname

Geben Sie den Namen der Survey Controller-Datei ein, die Sie importieren möchten.

Öffnen

Klicken Sie auf Öffnen, um die Datei zu importieren.

HINWEIS: Wenn die Kurvenbanddefinition Regelquerschnitte enthält, wird eine neue Regelquerschnittsbibliothek erstellt. Alle mit der importierten Trasse verknüpften Regelquerschnitte werden in dieser Bibliothek gespeichert. Die Bibliotheksbezeichnung entspricht der Trassenbezeichnung.


AutoCAD Drawing eXchange (DXF)-Datei

 Siehe auch

Verwenden Sie diese Option, um eine DXF-Datei zu importieren.

HINWEIS: Klicken Sie im Dialogfeld Importieren auf die Schaltfläche Konfiguration, um der Datei Einheiten zuzuweisen, unnötige Punkte aus Linien-, Kurven- und Bogendefinitionen zu entfernen, und vervollständigen Sie das Dialogfeld Konfiguration DXF/DWG-Import.

Dateiname

Geben Sie den Namen der DXF-Datei ein, die Sie importieren möchten.

Öffnen

Klicken Sie auf Öffnen, um die Datei zu importieren.


Dialogfeld Konfiguration DXF/DWG-Import

 Siehe auch

Das Dialogfeld Konfiguration DXF/DWG-Import besteht aus zwei Teilen: Einheiten und Polylinien komprimieren.

Einheiten

Wählen Sie im Feld Einheiten die richtigen Streckeneinheiten für die zu importierende DXF/DWG-Datei. Wenn für eine örtliche Anpassung z. B. Koordinaten in Internationalen Fuß benötigt werden, die importierte DXF-Datei aber mit Meter-Einheiten erstellt wurde, müssen Sie beim Importieren der DXF-Datei Meter wählen.

Polylinien komprimieren

Bei einer AutoCAD-Polylinie besteht die Strecke zwischen zwei Punkten aus vielen kleinen Liniensegmenten, Bögen oder Kurven. Sie können die Anzahl der Segmente beim Importieren reduzieren, indem Sie eine "komprimierte" gerade Linie erzeugen, wie in Abb. 1 dargestellt.

Abb. 1.  Kompressionstoleranz

In Abb. 1 werden die Segmente, die sich innerhalb einer Toleranz von XX mm von der "komprimierten" Polylinie befinden oder mit Y bezeichnet sind, entfernt.

So stellen Sie die Kompressionstoleranz für eine Datei ein:

 Wählen Sie das Kontrollkästchen Polylinien komprimieren, und stellen Sie die Kompressionstoleranz für die Polylinie ein. Individuelle Liniensegmente, Bögen oder Kurven werden dann beim Importieren aus der DXF- oder DWG-Datei entfernt und die Anzahl der Linien, Bögen und Kurven auf ein Minimum reduziert.

HINWEIS: Je geringer die Kompressionstoleranz, um so genauer ist die Darstellung des Diagramms.


Hintergrundliniennetz von TerraModel-Projektdatei

 Siehe auch

Verwenden Sie die Option Hintergrundliniennetz von TerraModel-Projektdatei (*.pro), um ein Liniennetz aus einer TerraModel-Projektdatei zu importieren.

Dateiname

Geben Sie den Namen der zu importierenden Datei ein.

Öffnen

Klicken Sie auf Öffnen, um die Datei zu importieren.

Das Dialogfeld Zu importierende Layer wählen erscheint. Verwenden Sie dieses Dialogfeld, um den/die geeigneten Layer für den Import zu wählen. Klicken Sie auf OK, um den/die gewählten Layer zu importieren.


Dialogfeld Zu importierende Layer wählen

 Siehe auch

Verwenden Sie das Dialogfeld Zu importierende Layer wählen, um die Layer einer Hintergrunddatei zu importieren.

Layer

Wählen Sie im Feld Layer den/die zu importierenden Layer.

Alle

Klicken Sie auf Alle, um alle Layer auszuwählen.

Keine

Klicken Sie auf Keine, um die Auswahl rückgängig zu machen.


Hintergrundliniennetz von AutoCAD Zeichnungsdatei

 Siehe auch

Verwenden Sie die Option Hintergrundliniennetz von AutoCAD Zeichnungsdatei (*.dwg), um Liniennetze aus einer AutoCAD Drawing (*.dwg)-Datei zu importieren.

HINWEIS: Klicken Sie im Dialogfeld Importieren auf die Schaltfläche Konfiguration, um der Datei Einheiten zuzuweisen, unnötige Punkte aus Linien-, Kurven- und Bogendefinitionen zu entfernen und um auf das Dialogfeld Konfiguration DXF/DWG-Import zuzugreifen.

Dateiname

Geben Sie den Namen der zu importierenden DWG-Datei ein.

Öffnen

Klicken Sie auf Öffnen, um die Datei zu importieren.

Das Dialogfeld Zu importierende Layer wählen erscheint. Wählen Sie in diesem Dialogfeld den/die zu importierenden Layer, und klicken Sie auf OK.


Bitmap-Bild

 Siehe auch

Verwenden Sie diese Option, um eine Bitmap-Datei (.bmp) in das Projekt zu importieren.

Dateiname

Geben Sie den Dateinamen des Bildes ein, das Sie importieren möchten.

Durchsuchen

Klicken Sie auf Durchsuchen, um das Dialogfeld Öffnen zu öffnen.

Geographische Position

Verwenden Sie die Gruppe Geographische Position, um das importierte Bitmap zu positionieren.

Ursprung Hochwert

Verwenden Sie die graphische Auswahl, um das Feld Ursprung Ho zu vervollständigen, oder geben Sie einen Koordinatensatz ein.

Ursprung Rechtswert

Verwenden Sie die graphische Auswahl, um das Feld Ursprung Re zu vervollständigen, oder geben Sie einen Koordinatensatz ein.

Breite

Verwenden Sie das Feld Breite, um die Breite des importierten Bitmaps im Projekt festzulegen.

Höhe

Verwenden Sie das Feld Höhe, um die Höhe des importierten Bitmaps im Projekt festzulegen.

HINWEIS: Der Ursprung ist die linke untere Ecke des Bitmap-Bilds.


Höhenlinienmodell

 Siehe auch

Verwenden Sie diese Option, um eine Oberflächen-Datei aus einem anderen Projekt in das geöffnete Projekt zu importieren.

Verfügbare Oberflächen

Klicken Sie auf Ordner, und navigieren Sie zu dem RoadLink – DTMLink Ordner des Projekts, in dem sich die Oberfläche(n) befindet/befinden. Unterhalb des Felds Verfügbare Oberflächen befindet sich eine Liste mit Oberflächen im gewählten Projekt. Wenn Sie eine dieser Oberflächenbezeichnungen hervorheben, wird die Oberflächenbezeichnung automatisch in das Feld Verfügbare Oberflächen eingegeben. Die Oberfläche wird daraufhin im aktuellen Projekt im RoadLink – DTMLink Ordner gespeichert.

Importieren

Klicken Sie auf Importieren, um mit dem Importiervorgang der Oberflächen-Datei zu beginnen.

HINWEIS: Die importierte Oberfläche kann mit einer Trasse verknüpft sein.


Beispiel ASCII-Datei

 Siehe auch

Es folgt ein Beispiel einer ASCII-Datei:

CLINE-DATEI V1.00

METRES

DEGREES

START CHAINAGE,12760.00

HORIZ

RN,Frontage road A1

N,CENTERLINE

PT,2330.0000,2046.8115,

R.,869.1748,97.74034,

CC,335.5834,-800.0000,

R.,388.7497,73.70595,

CL,63.0000,

CC,107.5127,400.0000,

CL,63.0000,

R.,518.2418,98.13010,

VERT.

N,CENTERLINE

,,12760.0000,4.6765,,,

,,13515.5012,4.5551,,,,150.0000,

,,14282.9090,6.6985,,,,250.0000,

,,14975.4563,7.1029,,,,

,,15105.2620,7.1029,,,

TEMPLATE

N,Type 1-A

O,0.000,0.000

G,18.000,-0.02000,Y,Y,

D,0.000,0.750,N,N,

G,3.000,-0.04000,Y,N,Shoulder

G,3.000,-0.20000,N,N,Ditch

B,0.500,-0.200,1.200,Catch

N,Type 1-B

O,0.000,0.000

G,18.000,-0.02000,Y,Y,

D,0.000,0.750,N,N,

G,3.000,-0.04000,Y,N,Shoulder

G,3.000,-0.20000,N,N,

B,0.500,-0.200,0.000,

SECTION

12760.000,Type 1-A,Type 1-A

13670.000,Type 1-B,Type 1-A

14230.000,Type 1-B,Type 1-B

SUPER

13519.174,-0.02000,-0.02000,0.000,0.000,CROWN

13579.174,-0.02000,0.02000,0.000,0.000,CROWN

13629.175,-0.05333,0.05333,0.000,0.000,CROWN

13669.174,-0.08000,0.08000,0.000,0.000,CROWN

13924.759,-0.08000,0.08000,0.000,0.000,CROWN

13964.758,-0.05333,0.05333,0.000,0.000,CROWN

14014.759,-0.02000,0.02000,0.000,0.000,CROWN

14074.759,-0.02000,-0.02000,0.000,0.000,CROWN

14337.758,-0.02000,-0.02000,0.000,0.000,CROWN

14353.508,0.00000,-0.02000,0.000,0.000,CROWN

14369.258,0.02000,-0.02000,0.000,0.000,CROWN

14416.508,0.08000,-0.08000,0.000,0.000,CROWN

14524.021,0.08000,-0.08000,0.000,0.000,CROWN

14571.271,0.02000,-0.02000,0.000,0.000,CROWN

14587.021,0.00000,-0.02000,0.000,0.000,CROWN

14602.771,-0.02000,-0.02000,0.000,0.000,CROWN


Kurvenbanddefinition von SDR33-Datei

 Siehe auch

Verwenden Sie diese Option, um horizontale und vertikale Kurvenbänder, Regelquerschnitte und Überhöhungs- und Ausweitungswerte aus einer SDR33-Datei zu importieren.

Dateiname

Geben Sie den Namen der SDR33-Datei ein, die Sie importieren möchten.

Öffnen

Klicken Sie auf Öffnen, um die Datei zu importieren.

HINWEIS: Wenn die Kurvenbanddefinition Regelquerschnitte enthält, wird eine neue Regelquerschnittsbibliothek erstellt. Alle mit der importierten Trasse verknüpften Regelquerschnitte werden in dieser Bibliothek gespeichert. Die Bibliotheksbezeichnung entspricht der Trassenbezeichnung.

HINWEIS: Sowohl TRIMMAP als auch SDRmapping and Design können SDR33 Kurvenbanddefinitions-Dateien für den direkten Import in RoadLink ausgeben.


Kurvenbanddefinition-Datei anderer Herkunft

 Siehe auch

Verwenden Sie diese Option, um eine Kurvenbanddefinitions-Datei anderer Herkunft zu importieren, die in einem Softwarepaket anderer Hersteller oder in einem anderen Trimble-Softwarepaket definiert wurde.

HINWEIS: In der RoadLink-Hilfe bezieht sich die Bezeichnung "anderer Herkunft" auch auf andere Trimble-Softwarepakete, z. B. Terramodel.

Eine Kurvenbanddefinitions-Datei enthält das horizontale Kurvenband. Sie kann auch die vertikalen Kurvenbanddaten und Querprofildaten enthalten.

  Horizontale Kurvenbänder können Geraden, Spiralen und Bögen enthalten. Sie können keine Kurve mit einem Ablenkungswinkel von mehr als 180 Grad enthalten. Ist der Ablenkungswinkel größer, müssen Sie den Bogen durch einen Wert von mindestens 2 teilen.

  Vertikale Kurvenbänder können Geraden, symmetrische Parabeln, asymmetrische Parabeln und kreisförmige Bögen enthalten.

  Querprofildaten werden durch Stationswert, Offset und Höhe definiert.

Ein Assistent für Sie durch den Importvorgang. Das RoadLink-Dienstprogramm erstellt beim Importieren der Kurvenbänder automatisch eine neue Trasse.

RoadLink berechnet importierte Spiralen als Klothoiden, die Geometrie kann dadurch leicht geändert werden. RoadLink akzeptiert keine Kurvenbänder, die als BSBBSB definiert sind, wobei B ein Bogen und S eine Spirale ist.

WARNUNG: Sie müssen die Einstellungen für Maßeinheiten in Trimble Geomatics Office so festlegen, daß sie mit denen der zu importierenden Datei anderer Herkunft übereinstimmen:

 Bei SDMS-Dateien, die einen UL:M-Datensatz enthalten, wird die Datei unabhängig von den in der Trimble Geomatics Office-Software eingestellten Einheiten in Meter übersetzt.

 Bei SDMS-Dateien, die einen UL:F-Datensatz enthalten, wird die Datei in Internationale Fuß übersetzt, es sei denn die Einheit ist in der Trimble Geomatics Office-Software auf US-Fuß eingestellt.

 Bei SDMS-Dateien, die einen UL-Datensatz enthalten, wird die Datei unter Verwendung der in der Trimble Geomatics Office-Software eingestellten Einheiten übersetzt.

RoadLink unterstützt folgende Softwarepakete anderer Herkunft:

Autodesk Civil Design / Softdesk	CAiCE (über das SDMS-Format)
CLIP	Cremer
DRD	Eagle Point
FastMap	Geodimeter (are)
Geodimeter (rln)	GEOPAK
Inroads	ISPOL
Istram	Leica RoadED
ModelMaker	MX GENIO
MXROAD SNC	NRG
REB	SDMS
SELM	Teku CAD
Terramodel	TRIMDESIGN / SDRdesign
TRIMMAP / SDRmap-Trassenkoordinaten	Wild GRE
Wählen Sie Trasse / Horizontal, um das horizontale Kurvenband anzusehen und zu bearbeiten. Wählen Sie Trasse / Vertikal, um das vertikale Kurvenband anzusehen und zu bearbeiten. Wenn die Trassendaten eine Querprofildatei enthalten, erzeugt RoadLink Regelquerschnitte aus dieser Datei. Beim Importieren einer MXROAD SNC-Datei werden ebenfalls Regelquerschnitte aus den Bändern erstellt. Die Regelquerschnitte werden in einer neuen Regelquerschnittsbibliothek gespeichert. Wählen Sie Extras / Regelquerschnitte, um die Regelquerschnitte anzusehen. Wählen Sie Trasse / Profile, um die entsprechenden Profile anzusehen.

HINWEIS: RoadLink reduziert die Anzahl der Regelquerschnitte, wenn benachbarte Regelquerschnitte identisch sind, oder wenn der Regelquerschnitt zwischen aneinandergrenzenden Regelquerschnitten interpoliert werden kann. Wenn aneinandergrenzende Regelquerschnitte eine unterschiedliche Anzahl an Elementen haben, fügt RoadLink den Regelquerschnitt <Keine> 2 mm nach dem ersten benachbarten Regelquerschnitt ein. Wenn eine Trasse mit dem Regelquerschnitt <Keine> abgesteckt wird, kann keine 3D-Absteckung für Stationswerte, die zwischen den benachbarten Regelquerschnitten liegen, durchgeführt werden. Diese begrenzten Absteckungsbereiche sind bei der Anzeige des Liniennetzes klar erkennbar, da Regelquerschnitte mit einer unterschiedlichen Anzahl an Elementen nicht durch Liniennetze verbunden sind. Dies ist eine Vorsichtsmaßnahme, da die Software die Interpolationsmethode für Regelquerschnitte mit einer unterschiedlichen Anzahl an Elementen nicht bestimmen kann.

HINWEIS: Bei Dateien, die Stationsgleichungen enthalten, werden die Stationswerte auf die wahren Stationswerte reduziert — RoadLink und Trimble-Vermessungsgeräte unterstützen keine Stationsgleichungen.

TIP: Wenn das RoadLink-Dienstprogramm eine Koordinatendifferenz meldet, und Sie den Entwurf anpassen möchten, werden die Koordinatenwerte beibehalten. Die Geometrie wird geändert und an die Koordinaten angepaßt. Wenn Sie den Entwurf nicht anpassen möchten, wird die Geometrie beibehalten und die Koordinaten werden an den Entwurf angepaßt.

Wenn RoadLink beim Importieren eines vertikalen Kurvenbandes einen Höhenunterschied meldet, empfiehlt Trimble, das vertikale Kurvenband bis auf mindestens 3 Dezimalstellen erneut zu erstellen. Werte für vertikale Gefälle sollten über mindestens 5 Dezimalstellen verfügen.


Regelquerschnitt enthält zusätzliche Elemente

Wenn ein Trassenkurvenband nicht mit der Regelquerschnittsoberfläche verbunden ist, fügt RoadLink zusätzliche Regelquerschnittselemente zur exportierten Oberfläche hinzu.

Abb. 1, 2 und 3 sind Beispiele, bei denen zusätzliche Regelquerschnittselemente (angegeben durch gestrichelte Linien) hinzugefügt wurden, um das Kurvenband mit der Regelquerschnittsoberfläche zu verbinden.

Abb. 1

Abb. 2

Abb. 3

Das Hinzufügen von Elementen bewirkt zweierlei:

Das zusätzliche Element repräsentiert nicht notwendigerweise den Entwurf.

Wenn die Regelquerschnittsoberfläche exportiert und die äußeren Punkte in Seitengefälle konvertiert wurden, wird das Seitengefälleelement neben dem Kurvenband nicht als Seitengefälleelement exportiert (siehe Abb. 1). Das geschieht, da dieser Punkt nicht länger der "äußere" Punkt ist, weil ein weiteres Regelquerschnittselement als Verbindungselement zwischen Kurvenband und Oberfläche hinzugefügt wurde.

HINWEIS: Wenn Sie mit der Trimble Survey Controller-Software abstecken, und das Feld Abstecken auf "Station und Offset" eingestellt ist, vergewissern Sie sich, daß das gewählte Offset wirklich die Oberfläche repräsentiert. Beachten Sie, daß, wenn das Feld Abstecken auf "Pos. auf Trasse" eingestellt ist, die im Bericht angegebenen Abtrags-/Auftragswerte nur dann korrekt sind, wenn Sie sich beim Abstecken über der Oberfläche befinden.


Exportieren aus der Autodesk-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von Autodesk-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten Daten der horizontalen und vertikalen Kurvenbänder sowie Querprofildaten, die mit der Autodesk Land Development Desktop-Software (Version 1 und höher) definiert wurden.

Horizontale und vertikale Kurvenbänder exportieren

So exportieren Sie horizontale und vertikale Kurvenbänder:

1.	Starten Sie die Land Development Desktop-Software, und öffnen Sie das Projekt.

2.	Wählen Sie die Civil Design-Menüpalette.

3.	Führen Sie einen der folgenden Schritte aus:

  Wählen Sie für horizontale Kurvenbänder Alignment / ASCII File Output / Alignment (Achsen / Ausgabe in ASCII-Datei / Achse). Wählen Sie das horizontale Kurvenband graphisch auf dem Bildschirm.

  Wählen Sie für vertikale Kurvenbänder Profile / ASCII File Output / Profile (Profil / Ausgabe in ASCII-Datei / Profil).

4.	Bestätigen Sie in der Befehlszeile folgendes:

  den Ausgabeordner

  den Namen der Ausgabedatei

5.	Klicken Sie auf Eingabe, um die Datei zu schreiben.

Querprofile exportieren

So exportieren Sie Querprofile:

1.	Wählen Sie in der Civil Design Palette des Land Development Desktop-Projekts Projekt / Zeichnungseinstellungen.

2.	Stellen Sie das Feld Programm im Dialogfeld Einstellungen bearbeiten auf Civil Design ein.

3.	Wählen Sie aus der Liste Settings die Option Cross Section Sampling, und klicken Sie auf Edit Settings. Das Dialogfeld Section Sampling Settings erscheint.

4.	Wählen Sie folgende Optionen aus der Gruppe Additional Sample Control, um sicherzustellen, daß die bestmöglichen Trassendaten exportiert werden:

  PC’s / PT’s

  TS − SC’s / CS − ST’s

  Alignment start (Kurvenbandbeginn)

  Alignment end (Kurvenbandende)

5.	Klicken Sie auf OK und dann auf Schließen.

6.	Wählen Sie Cross Section / ASCII File Output / Sections (Querprofil / Ausgabe in ASCII-Datei / Abschnitte).

7.	Bestätigen Sie in der Befehlszeile folgendes:

  den Ausgabeordner

  den Namen der Ausgabedatei

  die Anfangsstation

  die Endstation

8.	Klicken Sie auf Eingabe, um die Datei zu schreiben.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3.	Wählen Sie im Register Trasse die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Wählen Sie aus der Liste Datenformat die Option Autodesk Civil Design / Softdesk, und klicken Sie auf Weiter.

5.	Wählen Sie die aus Autodesk zu exportierenden Trassendateien, und klicken Sie auf Weiter.

6.	Wählen Sie die Achse mit dem vertikalen Kurvenband, und klicken Sie auf Weiter.

7.	Wählen Sie die Oberfläche, die die Querprofile enthält, und klicken Sie auf Weiter.

8.	Tun Sie folgendes

  Wählen Sie, falls erforderlich, die Kontrollkästchen Links der Trasse und Rechts der Trasse. Wählen Sie diese Kontrollkästchen z. B., wenn das Querprofil Geländeschnittpunkte enthält, und die äußeren Punkte in der Querprofildatei in Seitengefälle konvertiert werden sollen.

  Legen Sie die Werte für die Seitengefälletoleranz fest. Verwenden Sie diesen Wert, um den Seitengefällewert auf eine Ganzzahl aufzurunden.

  Wählen Sie, falls erforderlich, das Kontrollkästchen Hauptkurvenband aus Regelquerschnitt ausschließen. Wählen Sie dieses Kontrollkästchen, wenn die zu importierende Oberfläche nicht mit dem Sollprofil übereinstimmt. Wählen Sie es z. B., wenn ein Querprofilpunkt auf der Mittellinie eine Höhe hat, die nicht mit der Sollprofilhöhe übereinstimmt, um sicherzustellen, daß die Profilhöhe korrekt im entsprechenden Regelquerschnitt enthalten ist.

9.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

TIP: Beim Importieren einer Querprofildatei erstellt RoadLink eine neue Regelquerschnittsbibliothek mit Regelquerschnitten, die aus der importierten Datei definiert wurden. Die Bibliotheksbezeichnung entspricht dem Namen der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen. Wählen Sie Trasse / Profile, um die entsprechenden Querprofile anzusehen.

HINWEIS: Anwender von Autodesk R2 oder höher können eine Trasse unter Verwendung der Trimble Link-Software des Autodesk-Systems direkt zur Trimble Survey Controller-Software exportieren. Alternativ dazu kann eine .dc-Datei, die das Kurvenband definiert, von Autodesk in RoadLink importiert und in RoadLink bestätigt und bearbeitet werden, bevor sie zu einem Trimble-Vermessungsgerät übertragen wird. In beiden Fällen sollte das Dialogfeld Sample Settings wie unter "Querprofile exportieren", Schritt 1−4, konfiguriert werden.

Wählen Sie Dienstprogramme / Trimble Export / Trasse zu Survey Controller, um die Trasse direkt zu einem Trimble Survey Controller zu exportieren. Wählen Sie Dientsprogramme / Trimble Export – Trasse für SiteVision, um die Trasse als .dc-Datei zu exportieren. Wählen Sie zum Importieren der .dc-Datei in RoadLink Datei / Importieren / Register Trasse − Kurvenbanddefinition von Trimble Survey Controller-Datei.


Exportieren aus der CAiCE-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von CAiCE-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten nur horizontale Kurvenbänder, die mit der CAiCE-Software definiert wurden. Der Export aus der CAiCE-Software erfolgt über SDMS-Dateien, die RoadLink einlesen kann.

Horizontale Kurvenbänder exportieren

So exportieren Sie horizontale Kurvenbänder:

1.	Starten Sie die CAiCE-Software, und öffnen Sie das Projekt.

2.	Wählen Sie File / Export translators / To SDMS / Alignment to Alignment File (Datei / Zuordner exportieren / Zu SDMS / Achse in Achsdatei).

3.	Wählen Sie SNAPL und das zu exportierende Kurvenband (wählen Sie nur ein Kurvenband).

4.	Klicken Sie auf die linke Maustaste, um zum Dialogfeld zurückzukehren. Vergewissern Sie sich, daß nur ein Stationierungsname im Kontrollkästchen Objekte enthalten ist. Wenn mehrere Namen aufgelistet sind, deaktivieren Sie das Kontrollkästchen, und fahren Sie mit Schritt 2 fort.

5.	Klicken Sie auf OK. Das Dialogfeld Save (Speichern) erscheint.

6.	Geben Sie einen Dateinamen ein, und klicken Sie auf Save.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3.	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Wählen Sie in der Liste Datenformat die Option SDMS, und klicken Sie auf Weiter.

5.	Wählen Sie die Datei, die das horizontale Kurvenband enthält.

6.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten (das vertikale Kurvenband, Regelquerschnitte und die Überhöhung hinzufügen), bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.


Exportieren aus der Eagle Point-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von Eagle Point-Kurvenbanddefinitionen (Version 2000 und niedriger) in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten horizontale und (optional) vertikale Kurvenbänder, die mit der Eagle Point-Software definiert wurden.

Es gibt keine direkte Exportoption für die Eagle Point-Software. RoadLink liest die Teilprojektdateien, die bei der Definition der Trasse von der Eagle Point-Software erstellt werden.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3.	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Wählen Sie in der Liste Datenformat die Option Eagle Point, und klicken Sie auf Weiter.

5.	Wählen Sie die Dateien RCA**???.DAT und RCD**???.DAT aus dem entsprechenden Ordner.

Die Datei RCA**???.DAT definiert das horizontale und die Datei RCD**???.DAT das vertikale Kurvenband. Die ** stehen stellvertretend für die Kurvenbandnummer, die ??? für die Nummer des Teilprojekts.

6.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten (Regelquerschnitte und die Überhöhung hinzufügen), bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

HINWEIS: Wählen Sie für Eagle Point Version 2001 und höher die SDMS-Exportoption in der Software, um die horizontalen und vertikalen Kurvenbänder zu exportieren. Wählen Sie den in RoadLink zu importierenden SDMS-Datentyp mit Datei / Importieren – Kurvenbanddefinition-Datei anderer Herkunft.


Exportieren aus der GEOPAK-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von GEOPAK-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten die horizontalen und vertikalen Kurvenbänder und (optional) die Querprofile. DC-Dateien der Version 6.5 oder höher können von GEOPAK exportiert werden.

So exportieren Sie das horizontale und vertikale Kurvenband:

1.	Öffnen Sie in GEOPAK Version 2000 oder höher das Dialogfeld COORDINATE GEOMETRY (Koordinatengeometrie), und wählen Sie die gpk-Datei, die die Stationierung und die Punkte enthält.

2.	Wählen Sie im Dialogfeld COORDINATE GEOMETRY  FILE>EXPORT>ALIGNMENT AND PROFILES (Datei >Exportieren>Achse und Profile).

3.	Wählen Sie TRIMBLE DC als Exportformat.

4.	Wählen Sie die Version (6.5, 7.0 oder 7.5).

5.	Wenn Sie unter GEOPAK ROAD SITE OR SURVEY> USER PREFERENCES (Geopak Trasse oder Vermessung>Präferenzen) englische Einheiten benötigen, können Sie zwischen USFOOT und INT'L FOOT wählen.

HINWEIS: Wenn Sie unter USER PREFERENCES die Option METRIC wählen, werden die Berichte automatisch in metrischen Einheiten erstellt.

6.	Wählen Sie die Stationierung und das Profil, und geben Sie einen Namen für die zu erstellende Datei ein. Es wird nur jeweils eine Stationierung und ein Profil pro .dc-Datei erstellt.

7.	Klicken Sie auf Apply, um die .dc-Datei zu erzeugen.

So importieren Sie Querprofildaten:

  Wählen Sie unter GEOPAK ROAD > CROSS SECTIONS > CROSS SECTIONS REPORT > MULTILINE (Geopak > Querprofile > Querprofilbericht > Multilinie) die Option TRIMBLE DC als Ausgabeformat. Sie können diesen Bericht für bestehende Bodenquerprofile und/oder mögliche Querprofile erstellen. Die Querprofile sollten vor der Berichterstellung in eine 2D dgn-Datei geplottet werden.

HINWEIS: Die .dc-Dateien enthalten keine Projektions- und Datumsinformationen. Diese sind auf "None" (Keine) eingestellt.

Sie können die .dc-Datei zur Bestätigung und zur Bearbeitung in RoadLink importieren, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen. Wählen Sie dazu Datei / Importieren und dann im Register Trasse die Option Kurvenbanddefinition von Trimble Survey Controller-Datei.


Exportieren aus der InRoads-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von Inroads-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten horizontale und (optional) vertikale Kurvenbänder und Querprofile, die mit der InRoads-Software Version 7, der InRoads SelectCAD- oder der SiteWorks SelectCAD-Software definiert wurden.

Das Trimble-Berichtsmakro einrichten

Für den Export von Querprofildaten ist ein spezielles Berichtsmakro namens GeoTNL.dba erforderlich. Dieses Makro exportiert die Querprofile in eine Datei in einem Format, das von RoadLink verarbeitet werden kann.

So installieren Sie das Makro:

  Das Makro ist auf der Trimble Geomatics Office Installations-CD enthalten.

Kopieren Sie die Datei GeoTNL.dba aus dem Ordner <CD-Laufwerk>\Additional Utilities and Files\RoadLink macro files\Inroads in den Inroads-Systemordner, der die anderen Datenbank-Regelquerschnittsdateien enthält (normalerweise <Laufwerk>\winapp32\Ingr\Inroads\Data).

HINWEIS: Die folgenden Arbeitsschritte beziehen sich ausschließlich auf Inroads-Systeme, die auf einer Microstation-Plattform ausgeführt werden.

Vor dem Exportieren von Querprofildaten müssen Elemente definiert werden, die die allgemeinen Merkmale (z. B. Bordsteine) als komplexe Stationierungen definieren. Das bedeutet, daß sie als benachbarte Einheiten miteinander verbunden werden, bevor sie als Kurvenbänder exportiert werden. So führen Sie dies durch:

1.	Wählen Sie Settings / Locks (Einstellungen / Sperren), und dann die Kontrollkästchen Write (Schreiben) und Auto Plot (Auto-Plot).

2.	Wählen Sie aus der Haupt- oder Gruppen-Symbolleiste auf dem Hauptsymbolrahmen die Option Create Complex Chain (Komplexe Stationierung erstellen). Das Dialogfeld Create Complex Chain erscheint.

3.	Führen Sie in der Liste Method (Methode) einen der folgenden Schritte aus:

  Wählen Sie Automatic (Automatisch), wenn die Software automatisch alle Elemente verbinden soll, die nicht nebeneinander liegen. Geben Sie in das Feld Max Gap (Max Lücke) einen entsprechenden Wert ein, der sicherstellt, daß alle Elemente, die eine komplexe Stationierung definieren, miteinander verbunden sind.

  Wählen Sie Manual (Manuell), um alle nicht nebeneinanderliegenden Elemente manuell zu akzeptieren oder zurückzuweisen.

4.	Klicken Sie auf das erste Element am Anfang des Merkmals, das als komplexe Stationierung definiert werden soll:

Wenn Sie die Methode Automatisch gewählt haben, werden dieses und alle nachfolgenden Elemente miteinander verbunden, um eine komplexe Stationierung zu bilden. Die Elemente, die die komplexe Stationierung definieren, werden auf dem Bildschirm hervorgehoben.

Wenn Sie die manuelle Methode gewählt haben, werden alle Elemente, die das Merkmal definieren, miteinander verbunden, um eine komplexe Stationierung zu bilden. Dies wird so lange durchgeführt, bis die Software eine Lücke findet. Existiert eine Lücke zwischen den Elementen, erscheint folgende Warnmeldung in der Statusleiste: Automatic Create Complex Chain > Accept/Reject (Automatische Erstellung komplexer Stationierung > Akzeptieren/Zurückweisen). Führen Sie einen der folgenden Schritte aus:

  Wenn Sie die Lücke akzeptieren und fortfahren möchten, bis alle Elemente, die das Merkmal definieren, als Stationierung miteinander verbunden sind, klicken Sie an einer beliebigen Stelle im Graphikfenster auf die linke Maustaste.

  Wenn Sie die Lücke zurückweisen möchten, klicken Sie im Graphikfenster auf die rechte Maustaste.

5.	Klicken Sie mit der linken Maustaste auf eine beliebige Stelle im Graphikfenster, um den Definitionsvorgang zu beenden.

Wiederholen Sie diese Schritte für alle Merkmale, die als Kurvenbänder definiert werden sollen.

TIP: Es ist nützlich, für die Definition einer komplexen Stationierung einen neuen Layer mit einer eindeutigen Farbe für die Stationierungen zu erstellen.

WARNUNG: Alle Stationierungen müssen in dieselbe Richtung verlaufen wie die Trasse.

So importieren Sie die (als komplexe Stationierungen definierten) Merkmale als geometrische Kurvenbänder:

1.	Wählen Sie File / Geometry / Open (Datei / Geometrie / Öffnen). Das Dialogfeld Open Geometry (Geometrie öffnen) erscheint.

2.	Wählen Sie die .alg-Datei aus dem entsprechenden Ordner, und klicken Sie auf OK.

3.	Wählen Sie File / Import / Geometry from graphics (Datei / Importieren / Geometrie aus Graphik). Das Dialogfeld Import Geometry From Graphics (Geometrie aus Graphik importieren) erscheint.

4.	Wählen Sie in der Liste Select (Wählen) die Option Horizontal oder Vertikal.

5.	Geben Sie in das Feld Name einen Namen für das Kurvenband ein, und klicken Sie auf Apply (Anwenden). Wählen Sie im Graphikfenster das entsprechende Merkmal (komplexe Stationierung).

6.	Klicken Sie an einer beliebigen Stelle im Graphikfenster auf die linke Maustaste, um das Kurvenband zu akzeptieren. Eine Meldung erscheint in der Statusleiste, die den erfolgreichen Import des Kurvenbands bestätigt.

Wiederholen Sie diesen Vorgang für alle komplexen Stationierungen.

Exportieren aus der Inroads-Software Version 7.00

In den folgenden Abschnitten wird der Exportvorgang für horizontale und vertikale Kurvenbanddateien und Querprofildateien beschrieben.

TIP: Stellen Sie für die Streckenwerte mindestens 3 Dezimalstellen und für vertikale Seitengefälle mindestens 5 Dezimalstellen ein, um sicherzustellen, daß die exportierten Kurvenbänder und Querprofile genau sind.

Horizontale und vertikale Kurvenbänder exportieren

So exportieren Sie Kurvenbänder:

1.	Starten Sie die Inroads-Software.

2.	Wählen Sie File / Export / Ascii Geometry (Datei / Exportieren / ASCII-Geometrie).

3.	Wählen Sie das horizontale oder vertikale Kurvenband.

4.	Geben Sie den Projektnamen ein oder wählen Sie ihn, und klicken Sie auf Apply (Anwenden).

5.	Geben Sie den Namen der Exportdatei ein, wählen Sie den Exportordner, und klicken Sie auf Save (Speichern).

Querprofile exportieren

So exportieren Sie Querprofile:

1.	Wählen Sie Utilities / Reports / Geometry (Dienstprogramme / Berichte / Geometrie).

2.	Stellen Sie den Report Type (Berichtstyp) auf Station base (Stationsbasis) ein.

3.	Wählen Sie im Feld DBAccess Library (DBAccess-Bibliothek) die Bibliothek GeoTNL.dba.

4.	Wählen Sie im Feld DBAccess Template (DBAccess-Regelquerschnitt) den Regelquerschnitt Trimble_XREPORT.

5.	Führen Sie in der Gruppe Output (Ausgabe) folgende Schritte aus:

  Wählen Sie die ASCII-Option.

  Geben Sie einen Namen für die Datei ein.

HINWEIS: Der Pfad und Dateiname dürfen keine Leerzeichen enthalten. Verwenden Sie das DOS 8.3-Format für den Dateinamen.

6.	In der Gruppe Parameter:

 Geben Sie *  in das Feld Include alignments (Achsen einschließen) ein, um einen Bericht über Querprofildaten für alle Kurvenbänder, die mit dem aktiven horizontalen Kurvenband verknüpft sind, zu erhalten.

 Wählen Sie das Kontrollkästchen Include On Alignment Points (Punkte auf Achse einschließen).

 Wählen Sie, falls erforderlich, das Kontrollkästchen Station limits (Stationsgrenzen).

 Geben Sie die entsprechenden Werte in die Felder Start und Stop ein.

 Geben Sie einen entsprechenden Wert in das Feld Intervall ein.

 Geben Sie 0,000 in das Feld Offset ein.

6.	Klicken Sie auf Apply (Anwenden).

Exportieren aus InRoads SelectCAD oder SiteWorks SelectCAD, Version 8.00

In den folgenden Abschnitten wird der Exportvorgang für horizontale und vertikale Kurvenbanddateien und Querprofildateien beschrieben.

Horizontale und vertikale Kurvenbänder exportieren

So exportieren Sie die Kurvenbänder:

1.	Starten Sie die InRoads SelectCAD/SiteCAD-Software.

2.	Wählen Sie File / Export / Geometry (Datei / Exportieren / Geometrie).

3.	Wählen Sie das Register ASCII.

4.	Wählen Sie die Optionen Type, Horizontal Alignment oder Type, Vertical Alignment (Typ, Horizontale Achse oder Typ, Vertikale Achse).

5.	Geben Sie den Projektnamen ein, oder wählen Sie ihn.

6.	Wählen Sie das horizontale oder vertikale Kurvenband.

7.	Geben Sie den Namen der Exportdatei ein, und wählen Sie einen Exportordner.

8.	Klicken Sie auf Save (Speichern).

Querprofile exportieren

Gehen Sie wie unter InRoads-Software Version 7.00 vor, um Querprofile aus der InRoads SelectCAD- oder SiteWorks SelectCAD-Version 8.00 zu exportieren.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

2.	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Wählen Sie in der Liste Datenformat die Option Inroads, und klicken Sie auf Weiter.

5.	Wählen Sie die drei Trassendateien, die aus der InRoads-Software exportiert wurden, und klicken Sie auf Weiter.

6.	Führen Sie folgende Schritte aus:

  Wählen Sie, falls erforderlich, die Kontrollkästchen Links der Trasse und Rechts der Trasse. Wenn die Querprofildatei z. B. Geländeschnittpunkte enthält, wählen Sie diese Kontrollkästchen, um die äußeren Punkte der Querprofildatei in Seitengefälle zu konvertieren.

  Geben Sie den Wert für die Seitengefälletoleranz ein. Verwenden Sie diesen Wert, um das Seitengefälle auf eine Ganzzahl zu runden.

 Wählen Sie, falls erforderlich, das Kontrollkästchen Hauptkurvenband aus Regelquerschnitt ausschließen. Wählen Sie dieses Kontrollkästchen immer dann, wenn die zu importierende Oberfläche nicht mit dem Sollprofil übereinstimmt. Wählen Sie dieses Kontrollkästchen z. B., wenn ein Querprofilpunkt auf der Mittellinie eine orthometrische Höhe hat, die nicht mit der Sollprofilhöhe übereinstimmt. Dadurch wird sichergestellt, daß die Profilhöhe korrekt im entsprechenden Regelquerschnitt enthalten ist.

7.	Klicken Sie auf Ende.

 Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

TIP: Beim Importieren einer Querprofildatei erstellt RoadLink eine neue Regelquerschnittsbibliothek mit Regelquerschnitten, die aus der importierten Trasse definiert wurden. Die Bibliotheksbezeichnung entspricht dem Namen der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen und Trasse / Profile, um die entsprechenden Querprofile anzusehen.


Exportieren aus der Leica RoadED-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von LeicaRoadED-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten die horizontalen und vertikalen Kurvenbänder und werden mit Leica RoadED definiert.

Der Export kann nicht direkt aus der RoadED-Software erfolgen. RoadLink liest die Kurvenbanddateien, die bei der Definition der Trasse in RoadED erstellt wurden.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3.	Wählen Sie im Register Trasse die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Wählen Sie in der Liste Datenformat die Option Leica RoadED, und klicken Sie auf Weiter.

5.	Wählen Sie die in RoadED erzeugten aln*.gsi- und prf*.gsi-Dateien aus dem entsprechenden Ordner.

HINWEIS: Die Datei aln*.gsi definiert das horizontale und die Datei prf*.gsi das vertikale Kurvenband. Das * steht stellvertretend für einen vom Benutzer eingegebenen Namen. Die Software unterstützt GSI-8 und GSI-16 Formatdateien.

6.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten (Regelquerschnitte und Überhöhung hinzufügen), bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.


Exportieren aus der MXROAD-Software

 Siehe auch

In den folgenden Abschnitten wird der Export der Hauptachse und der Breitenbänder aus der MXRoad-Software zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. RoadLink kann die GENIO-Datei mit der Kurvenbanddefinition, die von der MXRoad-Software ausgegeben wird, lesen.

So übertragen Sie MXROAD-Kurvenbanddefinitionen, die die Hauptachse und die Breitenbänder enthalten. Gehen Sie in der MXROAD-Software folgendermaßen vor:

  Vergewissern Sie sich, daß die Standard-Namenskonvention für Bänder (SNC) aktiviert ist. Diese Funktion ist in der MXROAD-Software Version 1.2 oder höher verfügbar. Führen Sie dies unter Verwendung einer der folgenden Methoden aus:

−	Verwenden Sie die Meldung, die erscheint, wenn Sie ein neues Projekt beginnen.

−	Verwenden Sie das Register System Parameters (Systemparameter) unter Project Settings (Projekteinstellungen).

−	Verwenden Sie den Befehl Tools / System Parameters (Extras / Systemparameter).

(Wählen Sie im Register String naming (Achsname) das gleichnamige Kontrollkästchen).

Wenn SNC eingeschaltet ist, können nur bis zu 36 Trassenmittellinien pro Modell gespeichert werden, da nur die Eingabe alphanumerischer Zeichen erlaubt ist.

  Vergewissern Sie sich, daß alle Hauptachsen, die in einem Modell erstellt wurden, ein eindeutiges drittes Zeichen haben, andernfalls könnten Probleme auftreten.

Eine GENIO-Datei für die Bezugsachse exportieren

So exportieren Sie eine GENIO-Datei:

1.	Starten Sie MX für Microsoft Windows.

2.	Wählen Sie das entsprechende MX-Projekt.

3.	Wählen Sie File / Export / GENIO –  Output Strings to File (Datei / Exportieren / GENIO – Achsen in Datei ausgeben). Das Dialogfeld Output Strings to File erscheint.

4.	Führen Sie im Register Details folgende Schritte aus:

a.	Geben Sie in das Feld File Name (Dateiname) einen Dateinamen ein. Ändern Sie die Dateierweiterung zu .crd.

b.	Wählen Sie im Feld Model Name (Modellname) das Modell mit den zu exportierenden Achsen.

c.	Wählen Sie im Feld String name (Achsname) den Namen der zu exportierenden Achse(n).

d.	Treffen Sie eine Auswahl aus der Liste, um eine bestimmte Achsgruppe zu wählen.

e.	Wenn Sie alle Achsen exportieren möchten, geben Sie ???? ein, oder wählen Sie Alle aus der Gruppenliste.

f.	Vergewissern Sie sich, daß das Kontrollkästchen Rename String (Achse umbenennen) deaktiviert ist.

g.	Geben Sie, falls erforderlich, in das Feld Chainage Interval (Stationierungsintervall) ein neues Intervall für die Hauptachse ein. Das neue Intervall muß ein Vielfaches des bestehenden Stationierungsintervalls sein.

h.	Wählen Sie das Kontrollkästchen Output Headers (Kopfzeilen ausgeben).

i.	Wählen Sie das Kontrollkästchen Close File on Exit (Datei beim Beenden schließen).

5.	Deaktivieren Sie im Register Method (Methode) das Kontrollkästchen Specify Format (Format festlegen).

6.	Vergewissern Sie sich, daß die Felder Start und End im Register Start & End leer sind.

7.	Klicken Sie auf OK, um die Datei zu exportieren.

HINWEIS: In einem einzigen Modell darf ein bestimmtes Merkmal nur 18 mal vorkommen. Diese Begrenzung kann jedoch größtenteils umgangen werden, indem unverbundene Achsen gewählt werden.

HINWEIS: Es können mehrere Hauptachsen für den Export in eine GENIO-Datei gewählt werden. Beim Importieren der Datei in RoadLink kann jedoch jeweils nur eine Hauptachse gewählt werden.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3.	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Führen Sie in der Liste Datenformat einen der folgenden Schritte aus:

  Wählen Sie MX GENIO.

 Wenn die Datei Hauptachsen und Breitenbänder enthält und SNC eingeschaltet ist, wählen Sie MXROAD SNC.

5.	Klicken Sie auf Weiter.

6.	Wählen Sie die aus der MXROAD-Software exportierte GENIO-Datei.

7.	Führen Sie einen der folgenden Schritte aus:

 Klicken Sie auf Weiter, wenn eine MXROAD SNC-Datei importiert wird.

  Ist dies nicht der Fall, gehen Sie zu Schritt 9.

8.	Führen Sie folgende Schritte aus:

  Wählen Sie, falls erforderlich, die Kontrollkästchen Links der Trasse und Rechts der Trasse. Wenn die Querprofildatei z. B. Geländeschnittpunkte enthält, wählen Sie diese Kontrollkästchen, um die äußeren Punkte der Querprofildatei in Seitengefälle zu konvertieren.

  Geben Sie den Wert für die Seitengefälletoleranz ein. Verwenden Sie diesen Wert, um das Seitengefälle auf eine Ganzzahl zu runden.

  Wählen Sie, falls erforderlich, das Kontrollkästchen Hauptkurvenband aus Regelquerschnitt ausschließen. Wählen Sie dieses Kontrollkästchen immer dann, wenn die zu importierende Oberfläche nicht mit dem Sollprofil übereinstimmt. Wählen Sie dieses Kontrollkästchen z. B., wenn ein Querprofilpunkt auf der Mittellinie eine orthometrische Höhe hat, die nicht mit der Sollprofilhöhe übereinstimmt. Dadurch wird sichergestellt, daß die Profilhöhe korrekt im entsprechenden Regelquerschnitt enthalten ist.

9.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

TIP: Für MXROAD SNC-Dateien und MX GENIO-Dateien, in denen sich die Hauptachse auf andere Breitenbänder bezieht, erstellt RoadLink beim Importieren eine neue Regelquerschnittsbibliothek mit Regelquerschnitten, die aus der importierten Trasse definiert wurden. Regelquerschnitte, die MXROAD-Hauptachsen mit Breitenbändern verbinden, werden immer dann erstellt, wenn die Bandgeometrie eine Variation enthält. Eine neue Regelquerschnittsbibliothek mit den importierten Regelquerschnitten wird erstellt. Die Bibliotheksbezeichnung ist der Name der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen und Trasse / Profile, um die entsprechenden Querprofile anzusehen.


Exportieren aus der Terramodel-Software

 Siehe auch

In den folgenden Abschnitten wird der Export von Terramodel-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen enthalten horizontale und vertikale Kurvenbänder und Querprofile. Terramodel 9.82 kann eine .dc-Datei der Version 10.0 oder höher exportieren.

Bevor Sie ein Kurvenband exportieren, müssen Sie ein Exportskript erstellen:

1.	Starten Sie Terramodel, und öffnen Sie die zu exportierende Projektdatei.

2.	Wählen Sie die Menüoption Datei/Exportieren/Hochladen/Exportskriptmanager.

3.	Klicken Sie auf Neu, um eine neue Skript-Datei zu erstellen.

4.	Geben Sie einen Namen für die Skript-Datei ein, klicken Sie auf Auf Datenträger exportieren und dann auf Weiter.

5.	Wählen Sie Trassen-3D (dc) als Format für die Exportdatei. Klicken Sie auf Weiter.

6.	Führen Sie im Dialogfeld Trassen-DC-Zieldatei folgendes aus:

  Datei: Klicken Sie auf Eingabe, oder suchen Sie nach der zu erstellenden Datei.

  Trassenprojekt: Wählen Sie die zu exportierende Projektdatei. Wenn Stationsgleichungen in der Bezugsachse verwendet werden, wird die Stationierung auf der Grundlage der Stationseigenschaften des horizontalen Kurvenbandes erstellt, das auf der ersten Seite gewählt wurde. Die Anzahl der Querprofile ist von der Stationierung abhängig, die vom Benutzer gewählt wird. Die Achse und die Gradiente werden unabhängig vom gewählten Stationsbereich vollständig ausgegeben.

  Segmente: Wählen Sie das zu exportierende Segment aus der Segment-Liste.

  Beginn/Ende: Bearbeiten Sie die Werte für die Anfangs- und die Endstation, wenn Sie die Größe des Segments begrenzen möchten.

  Klicken Sie auf Weiter, um zum nächsten Dialogfeld zu gelangen.

HINWEIS: Wenn bei der Erstellung des Skripts kein Projekt geöffnet ist, müssen die Felder Trassenprojekt, Segmente und Beginn/Ende nicht ausgefüllt werden.

7.	Geben Sie im Dialogfeld Koordinatenverschiebung alle Offsets ein, die Sie zu den einzelnen Koordinatenwerten hinzufügen möchten. Klicken Sie auf Weiter, um zum nächsten Dialogfeld zu gelangen.

8.	Im Dialogfeld Querprofileinstellungen stehen mehrere Möglichkeiten zur Auswahl:

  QP-Intervall: Verwenden Sie diese Option, um das Intervall für die Regelquerschnittsprofile festzulegen.

  Min Toleranz: Geben Sie den Toleranzbereich für ein Querprofilelement ein. Wenn jedes Element eines Querprofils innerhalb der Toleranz liegt, wird das Querprofil als "identisches" Querprofil definiert und kein Regelquerschnitt gedruckt. Wird eine geringe Toleranz eingegeben, erhöht sich dadurch in der Regel die Anzahl der Regelquerschnitte; bei einer großen Toleranz verringert sich die Anzahl der Regelquerschnitte.

  Solloberfläche/Unterseite Planum: Wenn Sie (mit dem Terramodel-Planumsregelquerschnittsmanager) ein Planum definiert haben, können Sie die Daten entweder für die Solloberfläche (Voreinstellung) oder die Unterseite des untersten Planums exportieren.

  Klicken Sie auf Weiter, um zum nächsten Dialogfeld zu gelangen.

9.	Überprüfen Sie die Auswahl im Dialogfeld Zusammenfassung Export, und klicken Sie auf Exportieren.

10.	Das Dialogfeld Zusammenfassung Export wird (erneut) angezeigt. Es enthält einen Exportbericht. Klicken Sie auf Fertig, um das Dialogfeld zu verlassen.

Sie können nun das Skript zum Exportieren der Trasse verwenden:

1.	Wählen Sie die Menüoption Datei/Exportieren/Hochladen, und dann den Namen des in Schritt 4 erstellten Exportskripts.

2.	Exportieren Sie die DC-Datei, wie vorstehend unter Schritt 6-9 beschrieben.

HINWEIS: Die DC-Datei enthält keine Projektion und Datum-Transformation. Diese Optionen sind auf Keine eingestellt.

Sie können die .dc-Datei zur Bestätigung und Bearbeitung in RoadLink importieren, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen. Wählen Sie Datei / Importieren und dann im Register Trasse die Option Kurvenbanddefinition von Trimble Survey Controller-Datei.

TIP: Beim Importieren von Querprofilen erstellt RoadLink eine neue Regelquerschnittsbibliothek mit Regelquerschnitten, die aus der importierten Datei definiert wurden. Die Bibliotheksbezeichnung entspricht dem Namen der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen. Wählen Sie Trasse / Profile, um die entsprechenden Querprofile anzusehen.


Exportieren aus der TRIMMAP- oder SDRmap-Software
Exportieren aus der TRIMMAP- und SDRmap-Software

 Siehe auch

In den folgenden Abschnitten wird der Export folgender Daten aus der TRIMMAP- und SDRmap-Software beschrieben:

  Einfache Kurvenbanddefinitionen

  Kurvenbanddefinitionen, die abhängige Längsachsen enthalten

  Komplexe Kurvenbanddefinitionen

Einfache Kurvenbanddefinitionen übertragen

In den folgenden Abschnitten wird der Export einfacher TRIMMAP- und SDRmap-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät für die Absteckung beschrieben. Diese Kurvenbanddefinitionen müssen horizontale und (optional) vertikale Bezugsachsen, Regelquerschnitte und Überhöhungsdatensätze enthalten. Sie werden mit dem Design-Modul der TRIMMAP- oder SDRmapping and Design-Software (Version 5.0 oder höher) erstellt.

HINWEIS: Einfache Kurvenbanddefinitionen können keine asymmetrischen Parabeln in der vertikalen Definition enthalten. Darüber hinaus müssen die Regelquerschnitte aus einer einzigen Oberfläche ohne Entscheidungselemente bestehen. Längsachsen werden nicht unterstützt.

Horizontale und vertikale Kurvenbänder exportieren

So exportieren Sie die Kurvenbänder:

1. 	Starten Sie TRIMMAP oder SDRmapping and Design.

2. 	Wählen Sie Tools / Design / Hz and Vt design (Extras / Entwurf/ Hz und vt Entwurf) und dann die Trasse.

3. 	Wählen Sie Report / Alignment (Bericht / Achse).

4. 	Wählen Sie Nein in den Feldern All active alignments, All non active alignments und Vert annot (Alle aktiven Achsen, Alle nicht aktiven Achsen und Vert. Anmerk.).

5. 	Wählen Sie Ja in den Feldern Super, Horizontal, Vertical und Templates (Überhöhung, Horizontal, Vertikal und Regelquerschnitte). Klicken Sie auf Report (Bericht). Das Dialogfeld Send report to (Bericht senden zu) erscheint.

6. 	Wählen Sie das Kontrollkästchen DC file (DC-Datei) oder SDR file (SDR-Datei), und klicken Sie auf OK. Eines der folgenden Dialogfelder erscheint: DC Header information oder SDR Header information (DC-Kopfzeileninformation oder SDR-Kopfzeileninformation).

7. 	Geben Sie in das Feld DC job ID (DC-Projekt-ID) oder SDR job ID (SDR-Projekt-ID) den Namen der SDR-Datei ein.

8.	Wählen Sie aus der Liste DC Version oder SDR Version die Option SDR33 V04-03, und klicken Sie auf OK. Eine SDR-Datei mit den horizontalen und vertikalen Kurvenbanddefinitionen, den Überhöhungs- und Ausweitungsdatensätzen und den Stationswerten, denen die Regelquerschnitte zugewiesen wurden, wird exportiert (auch beim Export aus TRIMMAP).

Regelquerschnittsdefinitionen zu der Datei hinzufügen

So fügen Sie Regelquerschnittsdefinitionen hinzu:

1. 	Wählen Sie Tools / Design / XS Design & Comp. (Extras / Entwurf / RQ-Entwurf & Vergl).

2. 	Wählen Sie Template management / Report template (Regelquerschnittsverwaltung / Bericht Regelquerschnitt).

3. 	Stellen Sie die Option One template (Einen Regelquerschnitt) ein, und wählen Sie einen der Regelquerschnitte, die auf die ausgewählte Trasse angewendet wurden.

4. 	Klicken Sie auf OK. Das Dialogfeld Send report to (Bericht senden zu) erscheint.

5. 	Vergewissern Sie sich, daß das Kontrollkästchen DC-Datei oder SDR-Datei gewählt ist, und klicken Sie auf OK. Eines der folgenden Dialogfelder erscheint: Confirm DC file oder Confirm SDR file (DC-Datei bestätigen oder SDR -Datei bestätigen).

6. 	Wählen Sie das Kontrollkästchen Append (Hinzufügen), und klicken Sie auf OK.

Wiederholen Sie diesen Vorgang für alle Regelquerschnitte, die der Trasse zugewiesen wurden.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1. 	Starten Sie RoadLink.

2. 	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3. 	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition von SDR-Datei, und klicken Sie auf OK. Das Dialogfeld Öffnen erscheint.

4. 	Wählen Sie die SDR-Datei, und klicken Sie auf Öffnen.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

TIP: Wenn Regelquerschnitte in der SDR33-Datei enthalten sind, erstellt RoadLink eine neue Regelquerschnittsbibliothek mit den importierten Regelquerschnitten. Die Bibliotheksbezeichnung entspricht dem Namen der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen und Trasse / Profile, um die entsprechenden Querprofile anzusehen.

Kurvenbanddefinitionen mit abhängigen Längsachsen übertragen

In den folgenden Abschnitten wird der Export von TRIMMAP- und SDRmap-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät beschrieben. Diese Kurvenbanddefinitionen enthalten horizontale und vertikale Bezugsachsen und (optional) abhängige Längsachsen. Sie werden mit dem Design-Modul der TRIMMAP- oder SDRmapping and Design-Software (nur Version 6.5) erstellt.

HINWEIS: Die Software ignoriert alle Überhöhungen und Ausweitungen, die auf die Längsachsen angewendet wurden. Es können keine unabhängigen Längsachsen und Regelquerschnitte exportiert werden.

Horizontale und vertikale Kurvenbänder exportieren

So exportieren Sie die Kurvenbänder:

1. 	Wählen Sie in der TRIMMAP- oder SDRmapping and Design-Software Tools / Design / Hz and Vt design / Road management – Export road (Extras / Entwurf / Hz und Vt Entwurf / Trassenverwaltung – Trasse exportieren).

2. 	Wählen Sie die zu exportierende Trasse, und klicken Sie auf OK.

Eine Trimble Design Format (TDF)-Datei namens Export00x.job wird geschrieben, wobei ‘x’ die Trassennummer ist. Die Datei wird im Projektdatenordner gespeichert.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1.	Starten Sie RoadLink.

2.	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3.	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4.	Wählen Sie in der Liste Datenformat das TRIMDESIGN / SDRdesign-Datenformat, und klicken Sie auf Weiter.

5.	Wählen Sie die Datei, die die Kurvenbanddefinition enthält.

6.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten, bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

TIP: RoadLink erstellt eine neue Regelquerschnittsbibliothek, mit den importierten Regelquerschnitten, die aus den abhängigen Längsachsen definiert wurden. Die Bibliotheksbezeichnung entspricht dem Namen der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen und Trasse / Profile, um die entsprechenden Querprofile anzusehen.

Komplexe Kurvenbanddefinitionen übertragen

In den folgenden Abschnitten wird der Export komplexer TRIMMAP- und SDRmap-Kurvenbanddefinitionen in RoadLink zur späteren Übertragung auf ein Trimble-Vermessungsgerät beschrieben. Diese Kurvenbanddefinitionen müssen horizontale und vertikale Bezugsachsen und koordinierte Punkte, die die Querprofile definieren, enthalten. Sie werden mit dem Design-Modul der TRIMMAP- oder SDRmapping and Design-Software (nur Version 6.5) erstellt.

Komplexe Kurvenbanddefinitionen können asymmetrische Parabeln, Längsachsen und Regelquerschnitte enthalten. Regelquerschnitte können mehrere Oberflächen und Entscheidungselemente enthalten.

Zur Übertragung komplexer Kurvenbanddefinitionen benötigen Sie folgendes aus der TRIMMAP- oder SDRmapping and Design-Software:

  Vergewissern Sie sich, daß auf jeden Regelquerschnitt, der die Trasse definiert, der Elementtyp Design point (Sollpunkt) auf jedes Oberflächenelement für die abzusteckende Solloberfläche folgt.

  Koordinieren Sie die Trasse mit allen Punkten, die das Ende der einzelnen, zur Datenbank hinzugefügten Oberflächenelemente, definieren:

−	Wählen Sie Tools / Design / XS design & comp – Coordinate road (Extras / Entwurf / RQ-Entwurf & Vergl. – Trasse koordinieren).

−	Wählen Sie die Option Database control (Datenbankkontrolle), und weisen Sie allen Sollpunkten in den Trassenregelquerschnitten Codes zu. Geben Sie der Einfachheit halber den Punkten denselben Code wie dem Sollpunktnamen.

  Codieren Sie die Geländeschnittpunkte neu. Verwenden Sie einen gemeinsamen Namen (normalerweise sind diese durch Sollpunkte namens End of cut (Abtragsende) und End of fill (Auftragsende) definiert):

−	Wählen Sie Tools / Database editing / Set values (Extras / Datenbankbearbeitung / Werte festlegen).

−	Wählen Sie Select points (Punkte wählen).

−	Wählen Sie alle Punkte, die den Geländeschnitt definieren, und klicken Sie auf OK.

−	Geben Sie in das Code-Feld einen neuen gemeinsamen Codenamen ein (z. B. Geländeschnitt), und klicken Sie auf OK.

  Erstellen Sie ein ASCII-Ausgabeformat für die Trassendaten mit vier Dezimalstellen für Hoch- und Rechtswerte.

Horizontale und vertikale Kurvenbänder exportieren

So exportieren Sie die Kurvenbänder:

1. 	Wählen Sie in der TRIMMAP- oder SDRmapping and Design-Software Tools / Design / Hz and Vt design / Road management – Export road (Extras / Entwurf / Hz und Vt Entwurf / Trassenverwaltung – Trasse exportieren).

2. 	Wählen Sie die zu exportierende Trasse, und klicken Sie auf OK.

Eine Trimble Design Format (TDF)-Datei namens Export00x.job wird geschrieben, wobei ‘x’ die Trassennummer ist. Diese Datei wird im Projektdatenordner gespeichert.

Punkte exportieren, die die abzusteckende Regelquerschnitts(soll)oberfläche definieren

So exportieren Sie die Punkte:

1. 	Wählen Sie Tools / Import/Export / Write/read ASCII (Extras / Importieren/Exportieren / ASCII schreiben/lesen).

2. 	Wählen Sie im Feld Action die Option Create (Erstellen).

3. 	Wählen Sie im Feld Ausgabeformat (Output format) die Option TRIMMAP roading (TRIMMAP-Trassen), wenn Sie aus TRIMMAP exportieren, oder die Option SDRmap roading, wenn Sie aus SDRmap exportieren.

4. 	Verwenden Sie die Option Select points (Punkte wählen), um alle Punkte zu wählen, die die abzusteckende Solloberfläche definieren.

5. 	Geben Sie einen Namen für die Ausgabedatei in das Feld Output file name (Name Ausgabedatei) ein.

6. 	Wählen Sie im Feld Primary Sort (Erste Sortierung) die Option Station.

7. 	Wählen Sie im Feld Secondary Sort (Zweite Sortierung) die Option Offset, und klicken Sie auf OK.

Eine Datei mit Trassenkoordinaten wird geschrieben.

Kurvenbanddefinitionen in RoadLink importieren

So importieren Sie Kurvenbanddefinitionen:

1. 	Starten Sie RoadLink.

2. 	Wählen Sie Datei / Importieren. Das Dialogfeld Importieren erscheint.

3. 	Wählen Sie im Register Trasse aus der Liste Typen die Option Kurvenbanddefinition-Datei anderer Herkunft. Klicken Sie auf OK. Der Dateiöffnungs-Assistent erscheint. Jedesmal, wenn Sie auf Weiter klicken, erscheint ein neues Dialogfeld, abhängig von den gewählten Optionen.

4. 	Wählen Sie in der Liste Datenformat die Option TRIMMAP / SDRmap road coordinates, und klicken Sie auf Weiter.

5. 	Wählen Sie im Feld Kurvenbanddefinitionsdatei die Datei, die die horizontalen und vertikalen Kurvenbänder enthält.

6. 	Wählen Sie im Feld Trassenkoordinatendatei die Datei, die die Punkte enthält, die die Regelquerschnittsoberfläche definieren, und klicken Sie auf Weiter.

7. 	Wählen Sie die Trassennummer für die zu verarbeitenden Punkte, und klicken Sie auf Weiter.

8. 	Führen Sie folgende Schritte aus:

  Wählen Sie, falls erforderlich, die Kontrollkästchen Links der Trasse und Rechts der Trasse. Wenn die Querprofildatei z. B. Geländeschnittpunkte enthält, wählen Sie diese Kontrollkästchen, um die äußeren Punkte der Querprofildatei in Seitengefälle zu konvertieren

 Geben Sie den Wert für die Seitengefälletoleranz ein. Verwenden Sie diesen Wert, um das Seitengefälle auf eine Ganzzahl zu runden.

 Wählen Sie, falls erforderlich, das Kontrollkästchen Hauptkurvenband aus Regelquerschnitt ausschließen. Wählen Sie dieses Kontrollkästchen immer dann, wenn die zu importierende Oberfläche nicht mit dem Sollprofil übereinstimmt. Wählen Sie dieses Kontrollkästchen z. B., wenn ein Querprofilpunkt auf der Mittellinie eine orthometrische Höhe hat, die nicht mit der Sollprofilhöhe übereinstimmt. Dadurch wird sichergestellt, daß die Profilhöhe korrekt im entsprechenden Regelquerschnitt enthalten ist.

9.	Klicken Sie auf Ende.

Die Kurvenbanddefinition erscheint in RoadLink. Sie können sie bestätigen und, falls erforderlich, bearbeiten (Regelquerschnitte und die Überhöhung hinzufügen), bevor Sie sie zu einem Trimble-Vermessungsgerät übertragen.

RoadLink erstellt eine neue Regelquerschnittsbibliothek mit Regelquerschnitten, die aus der importierten Querprofildatei definiert wurden. Die Bibliotheksbezeichnung entspricht dem Namen der importierten Trasse. Wählen Sie Extras / Regelquerschnitt-Editor, um die Regelquerschnitte anzusehen und Trasse / Profile, um die entsprechenden Querprofile anzusehen.


Exportieren
Datei / Exportieren

	Klicken Sie auf das Symbol Exportieren auf der Standard-Symbolleiste
Verwenden Sie diesen Befehl, um Trassen- und Oberflächendaten zu einem Datenrekorder (einer Kontrolleinheit) oder in eine Datei zu exportieren.

HINWEIS: Dieser Befehl ist nur verfügbar, wenn eine Trasse geöffnet ist.

Im Register Trasse stehen folgende Dateitypen für den Export zur Verfügung:

Kurvenbanddefinition zu Vermessungsgeräten

Kurvenbanddefinition zu Trimble Survey Controller-Datei

Kurvenbanddefinition zu Trimble 3600/5600 GDM-Datei

Kurvenbanddefinition zu Trimble 3600/5600 TDS-Dateien

Kurvenbanddefinition zu TDS Survey Pro CE-Dateien

Kurvenbanddefinition zu SDR-Datei

Absteckungskoordinaten zu Vermessungsgeräten

Absteckungskoordinaten zu Trimble Survey Controller-Datei

Absteckungskoordinaten zu Trimble 3600/5600 GDM-Datei

Absteckungskoordinaten zu Trimble 3600/5600 TDS-Datei

Absteckungskoordinaten zu TDS Survey Pro CE-Datei

Absteckungskoordinaten zu SDR-Datei

ASCII-Kurvenbanddefinition-Datei (*.tdf)

Im Register Oberfläche stehen folgende Dateitypen für den Export zur Verfügung:

Trassenoberfläche zu Trimble Survey Controller

Trassenoberfläche zu Trimble TIN-DGM-Datei (*.ttm)

Trassenoberfläche zu Trimble 5600 TDS

Trassenoberfläche zu Trimble 5600 TDS-Datei (*.dtm)

Trassenoberfläche zu TDS Survey Pro CE

Trassenoberfläche zu TDS Survey Pro CE-Datei (*.dtm)

HINWEIS: Alle in Trimble Geomatics Office gewählten Koordinatensysteme werden beim Exportieren zur Trimble Survey Controller-Software übertragen. Wenn in Trimble Geomatics Office kein Koordinatensystem festgelegt wurde, wählen Sie eines im Trimble Survey Controller, bevor Sie mit der Absteckung beginnen.


ASCII-Kurvenbanddefinition-Datei (Exportieren)

 Siehe auch

Verwenden Sie diese Option, um eine ASCII-Kurvenbanddefinitions-Datei (*.tdf) aus dem Projekt als ASCII-Datei zu exportieren.

Die ASCII-Datei, die erzeugt wird, enthält die horizontalen und vertikalen Kurvenbanddefinitionen, Regelquerschnittsdefinitionen (einschließlich der Stationen, auf die sie angewandt werden) sowie die Überhöhungs- und Ausweitungswerte als ASCII-Datei, die exportiert werden kann.


Kurvenbanddefinition zu Vermessungsgeräten

 Siehe auch

Verwenden Sie diese Option, um eine Kurvenbanddefinitions-Datei direkt auf ein Vermessungsgerät zu übertragen. Folgende Vermessungsgeräte werden unterstützt:

  Trimble Survey Controller

  Trimble 3600/5600 GDM

  Trimble 3600/5600 TDS

  Sokkia-Datenrekorder (SDR)

Das RoadLink-Dienstprogramm erstellt eine Kurvenbanddefinitions-Datei für die Übertragung zum Vermessungsgerät.

HINWEIS:

Wenn Sie die Trasse mit dieser Option zur Trimble Survey Controller-Software übertragen, wählen Sie Vermessung / Abstecken / Trasse, wenn Sie die Trasse abstecken.

Wenn Sie die Trasse mit dieser Option zu einem Trimble 3600/5600 GDM-Instrument übertragen, wählen Sie Programm 39, wenn Sie die Trasse abstecken.

Kompatibilitätsregeln für Trassen, die aus RoadLink in ein 3600/5600 GDM-Instrument importiert werden, finden Sie unter Kompatibilität mit Trimble 3600/5600 GDM-Instrumenten.

Wenn Sie die Trasse mit dieser Option zu einem Trimble 3600/5600-Instrument mit der TDS-Software übertragen, wählen Sie Road / Road stakeout (oder Slope staking) (Trasse / Trassenabsteckung oder Gefälleabsteckung), wenn Sie die Trasse abstecken.

Kompatibilitätsregeln für Trassen, die aus RoadLink in ein Trimble 3600/5600 TDS-Instrument importiert werden, finden Sie unter Kompatibilität mit Trimble 3600/5600 TDS-Instrumenten und TDS Survey Pro CE-Kontrolleinheiten.


Kurvenbanddefinition zu Trimble Survey Controller-Datei

 Siehe auch

Verwenden Sie diese Option, um eine Kurvenbanddefinitions-Datei (*.DC) aus dem Projekt als Trimble Survey Controller-Datei zu exportieren, die von einer TSC1/TSCe-Kontrolleinheit (mit der Trimble Survey Controller-Software Version 6.50 oder höher) mit installierter Roading-Option gelesen werden kann.

Konfigurieren

Klicken Sie auf Konfigurieren, um die benötigte Version der Trimble Survey Controller-Software auszuwählen.

Wählen Sie das Kontrollkästchen Zu Datei hinzufügen, um die Kurvenbanddefinition zu einer bestehenden Trimble Survey Controller-Datei hinzuzufügen. Diese Option eignet sich, um Festpunkte zusammen mit der Kurvenbanddefinition zu exportieren.

Eine Kurvenbanddefinition verfügt über die horizontalen Kurvenbänder. Sie kann auch die vertikalen Kurvenbänder, Regelquerschnitte und Überhöhungsdatensätze enthalten — diese sind optional.

HINWEIS: Wenn Sie die Trasse mit dieser Option exportieren, wählen Sie Vermessung / Abstecken / Trassen, wenn Sie mit der Trimble Survey Controller-Software abstecken.


Konfigurations-Optionen

 Siehe auch

Klicken Sie auf Konfigurieren, um (falls verfügbar) die Version des benötigten Datenrekorders (der benötigten Kontrolleinheit) zu wählen.

Wählen Sie (falls verfügbar) das Kontrollkästchen Zu Datei hinzufügen, um die Datei hinzuzufügen.

Diese Optionen sind in der nachfolgenden Tabelle dargestellt:


Absteckungskoordinaten zu Vermessungsgeräten

 Siehe auch

Verwenden Sie diese Option, um die Koordinaten und Höhen für die Kurvenbanddefinition direkt zu einem Trimble-Vermessungsgerät zu exportieren. Folgende Geräte werden unterstützt:

  Trimble Survey Controller

  Trimble 3600/5600 GDM

  Trimble 3600/5600 TDS

  Sokkia-Datenrekorder (SDR)

Das RoadLink-Dienstprogramm erstellt eine Kurvenbanddefinitions-Datei für die Übertragung zum Vermessungsgerät.

HINWEISE:

Ein Höhenlinienmodell muß mit der Trasse verknüpft sein, wenn Geländeschnittpunkte enthalten sein sollen. Sie können das Höhenlinienmodell mit Trasse / Optionen wählen.

Wenn Sie die Koordinaten mit dieser Option übertragen, wählen Sie Vermessung / Abstecken / Trasse, wenn Sie die Trasse mit dem Trimble Survey Controller abstecken.

Wenn Sie die Koordinaten mit dieser Option übertragen, wählen Sie Programm 23 oder Programm 39, wenn Sie die Trasse mit einem Trimble 3600/5600 GDM-Instrument abstecken.

Wenn Sie die Koordinaten mit dieser Option übertragen, wählen Sie Stakeout / Stake points (Abstecken / Punkte abstecken), wenn Sie die Trasse mit einem Trimble 3600/5600-Instrument mit der TDS-Software abstecken.


Absteckungskoordinaten zu Trimble Survey Controller-Datei

 Siehe auch

Verwenden Sie diese Option, um die Koordinaten und Höhen für die Kurvenbanddefinition als Trimble Survey Controller (*.dc)-Datei zu exportieren, die von einer TSC1/TSCe-Kontrolleinheit (mit der Trimble Survey Controller-Software Version 4.0 oder höher) gelesen werden kann.

Konfigurieren

Klicken Sie auf Konfigurieren, um die benötigte Version der Trimble Survey Controller-Software auszuwählen.

Wählen Sie das Kontrollkästchen Zu Datei hinzufügen, um die Trassenpunkte zu einer bestehenden Trimble Survey Controller-Datei hinzuzufügen. Diese Option eignet sich, um Festpunkte zusammen mit den Trassenpunkten zu exportieren.

HINWEISE:

Ein Höhenlinienmodell muß mit der Trasse verknüpft sein, wenn die Geländeschnittpunkte enthalten sein sollen. Sie können das Höhenlinienmodell mit Trasse / Optionen wählen.

Wenn Sie die Koordinaten mit dieser Option übertragen, wählen Sie Vermessung / Abstecken / Trasse, wenn Sie die Trasse mit der Trimble Survey Controller-Software abstecken.


Dialogfeld Absteckung

 Siehe auch

Verwenden Sie das Dialogfeld Absteckung, um Absteckungskoordinaten für eine Solltrasse zu wählen. Sie können einen Absteckungsbericht für die gesamte Trasse oder für einen gewählten Teilabschnitt der Trasse erstellen lassen.

Beginn Station

Geben Sie den Wert der Anfangsstation für den Abschnitt der Trasse ein, für den der Absteckungsbericht erstellt werden soll.

Ende Station

Geben Sie den Wert der Endstation für den Abschnitt der Trasse ein, für den der Absteckungsbericht erstellt werden soll.

Solloberfläche

Wählen Sie die Option Solloberfläche, um einen Absteckungsbericht erstellen zu lassen, der automatisch alle Knoten enthält, die die gesamte, über die Sollquerprofile verlaufende Solloberfläche definieren.

Codes

Sie können die Codes wählen, für die die Absteckungspositionen im Bericht enthalten sein sollen. Klicken Sie auf die gewünschten Codes. Ein Häkchen erscheint links neben den gewählten Codes.

HINWEIS: Die Liste zeigt alle Codes an, die in den für die Solltrasse verwendeten Regelquerschnitten erscheinen.

Punkte benennen von

Verwenden Sie dieses Feld, um einen Startpunktnamen einzugeben.


Kurvenbanddefinition zu SDR-Datei

 Siehe auch

Verwenden Sie diese Option, um eine Kurvenbanddefinitions-Datei aus dem Projekt als SDR-Datei zu exportieren, die von einem Sokkia SDR-Datenrekorder (Version 04-03 oder höher) mit installierter Roading-Option gelesen werden kann.

Konfigurieren

Klicken Sie auf Konfigurieren, und wählen Sie das Kontrollkästchen Zu Datei hinzufügen, um die Kurvenbanddefinition zu einer bestehenden SDR-Datei hinzuzufügen. Diese Option eignet sich, um Festpunkte zusammen mit der Kurvenbanddefinition zu exportieren.


Absteckungskoordinaten zu SDR-Datei

 Siehe auch

Verwenden Sie diese Option, um eine SDR-Datei mit den Koordinaten und Höhen für die Kurvenbanddefinition zu exportieren, die von einem Sokkia SDR-Datenrekorder (Version 04-03 oder höher) gelesen werden kann.

Konfigurieren

Klicken Sie auf Konfigurieren, um die Trassenpunkte zu einer bestehenden SDR-Datei hinzuzufügen. Diese Option ist nützlich, um Festpunkte zusammen mit den Trassenpunkten zu exportieren.

HINWEIS: Ein Höhenlinienmodell muß mit der Trasse verknüpft sein, wenn die Geländeschnittpunkte enthalten sein sollen. Sie können das Höhenlinienmodell im Register Parameter im Dialogfeld Trassenoptionen wählen. Wählen Sie Trasse / Optionen, um auf dieses Dialogfeld zuzugreifen.


Kurvenbanddefinition zu Trimble 3600/5600 GDM-Datei

 Siehe auch

Verwenden Sie diese Option, um eine Kurvenbanddefinitions-Datei (*.rln) aus dem Projekt als Trimble 3600/5600 GDM-Datei zu exportieren, die von einem Trimble 3600/5600-Instrument gelesen werden kann. Eine Kurvenbanddefinitions-Datei enthält horizontale Kurvenbänder. Sie kann ebenfalls vertikale Kurvenbänder und Regelquerschnittsdatensätze enthalten.

HINWEIS: Wenn Sie die Trasse mit dieser Option exportieren, wählen Sie Programm 39, wenn Sie mit einem Trimble 3600/5600 GDM-Instrument abstecken.

Kompatibilitätsregeln für Trassen, die aus RoadLink in ein 3600/5600 GDM-Instrument importiert werden, finden Sie unter Kompatibilität mit Trimble 3600/5600 GDM-Instrumenten.


Kompatibilität mit Trimble 3600/5600 GDM-Instrumenten

 Siehe auch

Beachten Sie folgende Regeln, wenn Sie eine Trasse zur Absteckung auf ein Trimble 3600/5600 GDM-Instrument exportieren.

Für horizontale Kurvenbänder:

  Die Trassenbezeichnung darf maximal 8 Zeichen haben.

  Das erste und das letzte Segment eines Kurvenbandes muß eine gerade Linie sein.

TIP:  Spirale/Spirale-Kurven werden nicht unterstützt, können aber durch Einfügen eines kleinen Bogens zwischen zwei Spiralen angenähert werden.

Für vertikale Kurvenbänder:

  Die Anfangs- und Endstationen müssen mit dem horizontalen Kurvenband übereinstimmen.

  Das erste und das letzte Segment eines Kurvenbandes muß eine gerade Linie sein.

  Die Trasse darf keine asymmetrischen Parabeln enthalten.

Für Regelquerschnitte:

  Die Regelquerschnittsbezeichnung darf maximal 8 Zeichen haben.

  Regelquerschnitte können maximal 12 Elemente enthalten.

  Regelquerschnitte können keine Seitengefälleelemente enthalten.

TIP: Das letzte Regelquerschnittselement wird von einem Trimble 3600/5600 GDM-Instrument immer als Seitengefälleelement gehandhabt. Sie sollten daher beim Importieren von Kurvenbanddefinitionen anderer Herkunft in RoadLink, die später zu einem Trimble 3600/5600 GDM-Instrument übertragen werden sollen, die Kontrollkästchen "Äußere Punkte in Seitengefälle konvertieren" deaktivieren, damit das letzte Element vom Trimble 3600/5600 GDM-Instrument auch korrekt als Seitengefälleelement verwendet werden kann.

  Regelquerschnitte können keine Überhöhung und keine Ausweitung enthalten.

  Alle Regelquerschnitte, die einer bestimmten Trassenseite zugewiesen wurden, müssen dieselbe Anzahl an Elementen aufweisen.

TIP:  Obwohl Trimble 3600/5600 GDM-Instrumente Regelquerschnitte mit einer unterschiedlichen Anzahl an Elementen unterstützen, werden Übergänge zwischen diesen Regelquerschnitten nicht unterstützt. Sie sollten daher dieselbe Anzahl an Regelquerschnittselementen beibehalten, wenn ein Übergang zwischen zwei Regelquerschnittselementen enthalten sein soll.

Für Regelquerschnittszuweisungen:

  Die Trasse darf die Regelquerschnitte <Keine> und <Interpolieren> nicht enthalten.


Kurvenbanddefinition zu Trimble 3600/5600 TDS-Dateien

 Siehe auch

Verwenden Sie diese Option, um Kurvenbanddefinitions-Dateien (*.CR5, *.RD5 und *.tp5) aus dem Projekt zu einem Trimble 3600/5600 TDS-Instrument mit der TDS Survey Pro CE-Software zu exportieren.

Die *.RD5 Kurvenbanddefinitions-Datei enthält die horizontalen und vertikalen Kurvenbänder. Eine *.tp5-Datei enthält einen Regelquerschnitt. Es gibt für jeden Regelquerschnitt nur eine .tp5-Datei.

HINWEIS: Wenn Sie die Trasse mit dieser Option exportieren, wählen Sie Road / Road stakeout (oder Slope staking) (Trasse / Trassenabsteckung oder Gefälleabsteckung), wenn Sie mit einem Trimble 3600/5600-Instrument mit der TDS-Software abstecken.

Trimble empfiehlt, die Datei in einen neuen Ordner zu exportieren, damit nicht versehentlich bestehende .tp5-Dateien überschrieben werden.

Kompatibilitätsregeln für Trassen, die aus RoadLink in ein Trimble 3600/5600 TDS-Instrument importiert werden, finden Sie unter Kompatibilität mit Trimble 3600/5600 TDS-Instrumenten und TDS Survey Pro CE-Kontrolleinheiten.


Kompatibilität mit Trimble 3600/5600 TDS-Instrumenten und TDS Survey Pro CE-Kontrolleinheiten

 Siehe auch

Beachten Sie folgende Regeln, wenn Sie eine Trasse zur Absteckung auf ein Trimble 3600/5600 TDS-Instrument oder eine TDS Survey Pro CE-Kontrolleinheit exportieren.

Für horizontale Kurvenbänder:

  Die Trassenbezeichnung darf maximal 13 Zeichen haben.

Für vertikale Kurvenbänder:

  Die Trasse muß ein vertikales Kurvenband haben.

  Die Anfangsstation muß mit dem horizontalen Kurvenband übereinstimmen; das vertikale Kurvenband muß ebenso lang oder länger sein als das horizontale Kurvenband.

  Die Trasse darf keine asymmetrischen Parabeln und keine kreisförmigen vertikalen Kurven enthalten.

Für Regelquerschnitte:

  Die Regelquerschnittsbezeichnung darf maximal 8 Zeichen haben.

  Regelquerschnitte müssen mindestens 1 Element enthalten.

  Das Offset des ersten Regelquerschnittselements muß größer als Null sein.

  Regelquerschnitte mit Seitengefälleelementen dürfen keine Grabenbreite enthalten.

  In Regelquerschnitten darf die Überhöhung oder Ausweitung nur auf das erste Regelquerschnittselement angewandt werden.

  Alle Regelquerschnitte, die einer bestimmten Trassenseite zugewiesen wurden, müssen dieselbe Anzahl an Elementen aufweisen.

Für die Überhöhungs- und Ausweitungsanwendung:

  Für eine Überhöhung mit einer Ausweitung kann nur die Drehpunktoption Kuppe gewählt werden.

Für Regelquerschnittszuweisungen:

  Die Trasse darf die Regelquerschnitte <Keine> und <Interpolieren> nicht enthalten.

  Regelquerschnitte müssen sowohl der linken als auch der rechten Trassenseite zugewiesen werden.

  Regelquerschnitte müssen an der Anfangsstation zugewiesen werden.


Absteckungskoordinaten zu Trimble 3600/5600 GDM-Datei

 Siehe auch

Verwenden Sie diese Option, um eine Datei mit Trimble 3600/5600 GDM (*.are)-Koordinaten und Höhen für die Kurvenbanddefinition zu exportieren, die von einem Trimble 3600/5600-Instrument gelesen werden kann.

HINWEISE:

Ein Höhenlinienmodell muß mit der Trasse verknüpft sein, wenn Geländeschnittpunkte enthalten sein sollen. Sie können das Höhenlinienmodell unter Trasse / Optionen wählen.

Wenn Sie die Koordinaten mit dieser Option exportieren, wählen Sie Programm 23 oder Programm 39, wenn Sie mit einem Trimble 3600/5600 GDM-Instrument abstecken.


Absteckungskoordinaten zu Trimble 3600/5600 TDS-Datei

 Siehe auch

Verwenden Sie diese Option, um eine Trimble 3600/5600 TDS (*.cr5)-Datei mit Koordinaten und Höhen für die Kurvenbanddefinition zu einem Trimble 3600/5600-Instrument mit der TDS Survey Pro CE-Software zu exportieren

HINWEISE:

Ein Höhenlinienmodell muß mit der Trasse verknüpft sein, wenn Geländeschnittpunkte enthalten sein sollen. Sie können das Höhenlinienmodell unter Trasse / Optionen wählen.

Wenn Sie die Koordinaten mit dieser Option exportieren, wählen Sie Stakeout points and Offset (Absteckungspunkte und Offset), wenn Sie mit einem Trimble 3600/5600-Instrument abstecken.


Kurvenbanddefinition zu TDS Survey Pro CE-Dateien

 Siehe auch

Verwenden Sie diese Option, um Kurvenbanddefinitions-Dateien (*.JOB, *.RD5 und *.tp5) aus dem Projekt zu exportieren, die von einer TDS Survey Pro CE-Kontrolleinheit gelesen werden können.

Die *.RD5 Kurvenbanddefinitions-Datei enthält die horizontalen und vertikalen Kurvenbänder. Eine *.tp5-Datei enthält einen Regelquerschnitt. Es gibt für jeden Regelquerschnitt nur eine .tp5-Datei.

HINWEIS: Wenn Sie die Trasse mit dieser Option exportieren, wählen Sie Road / Road stakeout (oder Slope staking) (Trasse / Trassenabsteckung bzw. Gefälleabsteckung), wenn Sie mit einer TDS Survey Pro CE-Kontrolleinheit abstecken.

Trimble empfiehlt, die Datei in einen neuen Ordner zu exportieren, damit bestehende .tp5-Dateien nicht versehentlich überschrieben werden.

Kompatibilitätsregeln für Trassen, die aus RoadLink zu einer TDS Survey Pro CE-Kontrolleinheit exportiert werden, finden Sie unter Kompatibilität mit Trimble 3600/5600 TDS-Instrumenten und TDS Survey Pro CE-Kontrolleinheiten.


Absteckungskoordinaten zu TDS Survey Pro CE-Datei

 Siehe auch

Verwenden Sie diese Option, um Kurvenbanddefinitions-Dateien (*.JOB, *.RD5 und *.tp5) aus dem Projekt zu exportieren, die von einer TDS Survey Pro CE-Kontrolleinheit gelesen werden können.

HINWEISE: Ein Höhenlinienmodell muß mit der Trasse verknüpft sein, wenn Geländeschnittpunkte enthalten sein sollen. Sie können das Höhenlinienmodell unter Trasse / Optionen wählen.

Wenn Sie die Koordinaten mit dieser Option exportieren, wählen Sie Stakeout / Stake Points (oder Stake list of Points) (Abstecken /  Punkt abstecken bzw. Punktabsteckungsliste) , wenn Sie mit einer TDS Survey Pro CE-Kontrolleinheit abstecken.


Trassenoberfläche zu Trimble Survey Controller

 Siehe auch

Verwenden Sie diese Option, um eine triangulierte DGM-Datei (.ttm) der Trasse für den direkten Export zu einer TSC1/TSCe-Kontrolleinheit mit der Trimble Survey Controller-Software Version 6.50 oder höher zu erstellen.

Der Trimble Survey Controller liest die Datei bei der Absteckung.

HINWEIS: Wenn Sie die Oberfläche mit dieser Option exportieren, wählen Sie Vermessung / Abstecken / DGM, wenn Sie mit der Trimble Survey Controller-Software abstecken.


Trassenoberfläche zu Trimble TIN DGM-Datei (*.ttm)

 Siehe auch

Verwenden Sie diese Option, um eine triangulierte DGM-Datei (.ttm) der Trasse zu erstellen, die von einer TSC1/TSCe-Kontrolleinheit mit der Trimble Survey Controller-Software Version 6.50 oder höher gelesen werden kann.

HINWEIS: Wenn Sie die Oberfläche mit dieser Option exportieren, wählen Sie Vermessung / Abstecken / DGM, wenn Sie mit der Trimble Survey Controller-Software abstecken.


Trassenoberfläche zu Trimble 5600 TDS

 Siehe auch

Verwenden Sie diese Option, um eine triangulierte DGM-Datei der Trassenoberfläche direkt zu einem Trimble 5600 TDS-Instrument zu exportieren. Das RoadLink-Dienstprogramm erstellt eine Datei für die Übertragung zum Trimble 5600 TDS-Instrument.

Konfigurieren

Klicken Sie auf Konfigurieren, um die Einheiten für die Datei festzulegen.

HINWEIS: Wenn Sie die Oberfläche mit dieser Option exportieren, wählen Sie Stakeout / Stake DTM (Abstecken / DGM abstecken), wenn Sie mit einem Trimble 5600 TDS-Instrument abstecken.


Trassenoberfläche zu Trimble 5600 TDS-Datei (*.dtm)

 Siehe auch

Verwenden Sie diese Option, um eine Trassenoberfläche als Trimble 5600 TDS (*.dtm)-Datei zu exportieren, die von einem Trimble 5600 TDS-Instrument mit der TDS Survey Pro CE-Software gelesen werden kann.

Konfigurieren

Klicken Sie auf Konfigurieren, um die Einheiten für die Datei festzulegen.

HINWEIS: Wenn Sie die Oberfläche mit dieser Option exportieren, wählen Sie Stakeout / Stake DTM (Abstecken / DGM abstecken), wenn Sie mit einem Trimble 5600 TDS-Instrument abstecken.


Trassenoberfläche zu TDS Survey Pro CE

 Siehe auch

Verwenden Sie diese Option, um eine triangulierte DGM-Datei der Trassenoberfläche direkt zu einer TDS Survey Pro CE-Kontrolleinheit zu exportieren. RoadLink erstellt eine Datei für die Übertragung zur TDS Survey Pro CE-Kontrolleinheit.

Konfigurieren

Klicken Sie auf Konfigurieren, um die Einheiten für die Datei festzulegen.

HINWEIS: Wenn Sie die Oberfläche mit dieser Option exportieren, wählen Sie Stakeout / Stake DTM (Abstecken / DGM abstecken), wenn Sie mit einer TDS-Kontrolleinheit abstecken.


Trassenoberfläche zu TDS Survey Pro CE-Datei (*.dtm)

 Siehe auch

Verwenden Sie diese Option, um eine Trassenoberfläche als TDS Survey Pro CE-Datei (*.dtm) zu exportieren, die von einer TDS Survey Pro CE-Kontrolleinheit gelesen werden kann.

Konfigurieren

Klicken Sie auf Konfigurieren, um die Einheiten für die Datei festzulegen.

HINWEIS: Wenn Sie die Oberfläche mit dieser Option exportieren, wählen Sie Stakeout / Stake DTM (Abstecken / DGM abstecken), wenn Sie mit einer TDS Survey Pro CE-Kontrolleinheit abstecken.


TDS TIN-DGM-Optionen exportieren

 Siehe auch

Verwenden Sie diese Option, um die Einheiten festzulegen, in denen die Datei exportiert werden soll.

Klicken Sie auf das Menü, um die Einheiten zu ändern, und treffen Sie eine Auswahl aus den verfügbaren Optionen.


Parameter

Das Register Parameter im Dialogfeld Trassenoptionen zeigt die verfügbaren Optionen an.

Trassendetails

Verwenden Sie die Felder in der Gruppe Trassendetails, um die Anfangsstation und die mit der Trasse verknüpfte Oberfläche zu bearbeiten.

Beginn Station	Verwenden Sie dieses Feld, um die Anfangsstation zu ändern.

Stationsintervall	Verwenden Sie dieses Feld, um das Intervall für die Erstellung von Querprofilen festzulegen.

Das RoadLink-Dienstprogramm erzeugt automatisch Querprofile an:

  den Anfangs- und Endstationen

  den festgelegten Intervallen

  alle horizontalen Kurvenpunkten (dies sind PC-, PT-, TS-, SC-, CS- und ST-Positionen )

  jeder weiteren Änderung der horizontalen Richtung des Kurvenbandes. Wenn es zu einer horizontalen Richtungsänderung ohne Kurven kommt, werden die Querprofile an der Winkelhalbierenden genommen, siehe Abb. 1.

Abb. 1 : Querprofile an der Winkelhalbierenden

  allen vertikalen Kurvenpunkten, d. h. am Beginn und Ende der vertikalen Kurven sowie an der VSP-Position, wenn keine Kurve zugewiesen wurde.

  allen Überhöhungsdatensätzen

Oberfläche	Verwenden Sie die Oberflächenliste, um eine Oberfläche, die mit der Trasse verknüpft werden soll, auszuwählen oder zu ändern. Sie müssen eine Oberfläche für die Berechnung der Volumen für Erdarbeiten und für die Anzeige der Oberfläche in der Profil- und Querprofilansicht wählen. Die Oberflächenliste enthält alle Oberflächen im aktuellen Projekt sowie alle Oberflächen, die aus einem anderen Projekt importiert wurden (verwenden Sie die Option Höhenlinienmodell im Dialogfeld Importieren, um eine Oberfläche aus einem anderen Projekt zu importieren). HINWEIS: Wenn ein Höhenlinienmodell mit der Trasse verknüpft werden soll, müssen Sie die Oberfläche zuerst im DTMLink-Dienstprogramm erstellen (Oberflächen, die aus Software anderer Herkunft in DTMLink importiert wurden, stehen in RoadLink nicht zur Verfügung).
Querprofilbreite Urgelände (dieses Feld ist nur verfügbar, wenn eine Oberfläche gewählt ist)	Verwenden Sie dieses Feld, um die Querprofilbreite des Urgeländes einzugeben. Der festgelegte Wert wird links und rechts der Mittellinie angewandt. Die Voreinstellung in diesem Feld beträgt 20 m für metrische Projekte und 50 ft für nicht-metrische Projekte. Damit genaue Volumenberechnungen durchgeführt werden können, muß die Querprofilbreite Urgelände mindestens so breit sein, wie die maximale Ausdehnung des Seitengefälles.
Kurvenzeichnung

Verwenden Sie das Feld in der Gruppe Kurvenzeichnung, um das vertikale Kurvenzeichnungsintervall anzugeben.

Vertikale Kurven, die in RoadLink auf dem Bildschirm angezeigt werden, werden durch kurze Liniensegmente angenähert. Das Feld Vertikales Kurvenzeichnungsintervall läßt Sie das Intervall (in Bodeneinheiten) zwischen den für die Zeichnung dieser Liniensegmente verwendeten Punkten angeben. Je größer das Intervall ist, desto kürzer ist die Erstellungszeit für die Zeichnung, aber die Kurve ist auf dem Bildschirm weniger genau definiert.

Anmerkungsdetails Mittellinie

Verwenden Sie die Gruppe Anmerkungsdetails Mittellinie, um die Anzeige der Beschriftung der Mittellinie zu steuern.

Achselementbeschriftung

Wählen Sie das Kontrollkästchen Achselementbeschriftung, um die automatische Stationsbeschriftung der Mittellinie bei den Kurvenmerkmalen (das sind PC, PT, TS, SC, CS und ST) auszuschalten.
Dieses Kontrollkästchen ist gemäß Voreinstellung gewählt.

Querprofilbeschriftungen

Wählen Sie das Kontrollkästchen Querprofilbeschriftungen, um die automatische Stationsbeschriftung der Mittellinie bei den regulären Stationsintervallen –  wie bei der Definition einer neuen Trasse festgelegt – auszuschalten. Wählen Sie Trasse / Optionen / Stationsintervall, um das Intervall zu bearbeiten.

Anmerkungshöhe

Verwenden Sie dieses Feld, um die Texthöhe der Mittellinienbeschriftung einzustellen.


Liste vorheriger Trassen
Datei / Liste vorheriger Trassen

Eine Liste zuvor verwendeter Trassen erscheint am Ende des Dateimenüs. Jeder Bezeichnung ist eine Zahl vorangestellt. Klicken Sie auf einen beliebigen Dateinamen in der Liste, um diese Datei zu öffnen, oder verwenden Sie die Tastatur, um die neben der Trasse aufgelistete Zahl einzugeben.


Beenden
Datei / Beenden

Verwenden Sie diesen Befehl, um das aktuelle Projekt zu schließen und das RoadLink-Dienstprogramm zu beenden.

Sie werden gefragt, ob Sie alle vorgenommene Änderungen speichern möchten, bevor Sie RoadLink beenden.


Menü "Datei"
Menü “Datei”

Verwenden Sie das Menü “Datei”, um Trassen zu verwalten, Daten in Projekte zu importieren und von Projekten zu exportieren und um Projektoptionen einzurichten. Das Menü verfügt über die folgenden Befehle:

Neue Trasse

Trasse öffnen

Trasse speichern

Trasse speichern unter

Trasse schließen

Trasse löschen

Trasse umbenennen

Importieren

Exportieren

Liste vorheriger Trassen

Beenden


Hilfethemen
Hilfe / Hilfethemen

Im RoadLink-Dienstprogramm sind Befehle in Menüs gruppiert.

Die Menübefehle sind:

Datei

Bearbeiten

Ansicht

Trasse

Extras

Fenster

Hilfe

Das Menü “Extras” verfügt über den folgenden Befehl:

Regelquerschnitt-Editor


Tip des Tages
Hilfe / Tip des Tages

Das System “Tip des Tages” bietet kurze, hilfreiche Tips, die Ihnen bei der Bedienung des Systems assistieren.

Wählen Sie diese Option, und der nächste Tip des Tages erscheint. Ein Kontrollkästchen im Dialogfeld “Tip des Tages” läßt Sie wählen, ob ein Tip jedesmal erscheint, wenn Sie das System starten.


Info
Hilfe / Info

Der Befehl “Info” im Menü “Hilfe” zeigt Programm- und Copyright-Informationen bezüglich der RoadLink Software an.

HINWEIS: Es ist nicht zulässig, dieses Programm zu kopieren, es sei denn, dies geschieht für Archiv- oder Datensicherungszwecke.


Menü "Hilfe"

Das Menü “Hilfe” bietet Information über die RoadLink Software.

Es verfügt über die folgenden Befehle:

Hilfethemen

Tip des Tages

Info


Die Symbolleisten verwenden

Symbolleisten bieten schnellen und in einem Schritt durchführbaren Zugriff auf häufig verwendete Menübefehle. Eine kurze Beschreibung jeder Schaltfläche der Symbolleiste erscheint auf der Statusleiste, wenn Sie die Maus über der Schaltfläche positionieren.

Die Meldung “Verschiebt Mitte von Zoom-Bereich” erscheint z. B. , wenn Sie auf die Schaltfläche "Verschieben" [image] auf der Ansicht-Symbolleiste klicken.

Sie können jede der Symbolleisten verbergen, verschieben oder deren Größe verändern, und Sie können sie Ihren Arbeitsanforderungen gerecht anordnen.

Symbolleisten passen sich entweder an eine der Hauptfensterseiten, oberhalb des Arbeitsbereichs und unterhalb der Menüs, oder unterhalb des Arbeitsbereichs und unterhalb der Statusleiste an. Als Alternative können Sie jede Symbolleiste zu einer beliebigen Stelle auf dem Bildschirm verschieben und sie vertikal oder horizontal ausrichten.

Um die Voreinstellungen wiederherzustellen, klicken Sie auf die Schaltfläche Zurücksetzen in Ansicht / Symbolleisten. (Jede Symbolleiste wird auf die Voreinstellungen zurückgesetzt, wenn Sie auf die Titelleiste der Symbolleiste doppelklicken).

QuickInfos

Wenn Sie den Cursor über einer Symbolschaltfläche positionieren, wird ein kleines Fenster namens QuickInfo eingeblendet, das Ihnen mitteilt, welche Funktion dieses Symbol hat. Die kurze Beschreibung erscheint neben dem Cursor und unterhalb des Symbols.

Die Meldung "Verschieben" erscheint z. B. , wenn Sie auf die Schaltfläche “Verschieben” auf der Ansicht-Symbolleiste klicken.

HINWEIS: Das Docken der Symbolleisten verbirgt die Titelleiste.

Folgende Symbolleisten stehen zur Verfügung:

Standard-Symbolleiste

Ansicht-Symbolleiste


Standard-Symbolleiste

Die Standard-Symbolleiste bietet schnellen Zugriff auf einige Elemente im Hauptmenü.

Die folgenden Optionen sind von der Standard-Symbolleiste verfügbar:

Schaltfläche	Menübefehl	Beschreibung
	Datei / Importieren	Importiert Daten aus einer Datei
	Datei / Exportieren	Exportiert Daten in eine Datei
	Bearbeiten / Einfügen	Fügt den Inhalt der Zwischenablage ein
	Bearbeiten / Ausschneiden	Schneidet die Auswahl aus und kopiert sie in die Zwischenablage
	Bearbeiten / Kopieren	Kopiert die Auswahl und verlegt diese Kopie in die Zwischenablage
	Bearbeiten / Rückgängig	Macht den letzten Vorgang rückgängig
	Ansicht / Eigenschaften	Zeigt das Eigenschaftsfenster an, so daß die Eigenschaften der aktuellen Auswahl angesehen oder bearbeitet werden können


Ansicht-Symbolleiste

Die Ansicht-Symbolleiste bietet Navigationssymbole, um Ihnen bei der Ansicht im Graphik-Hauptfenster zu assistieren.

Die folgenden Optionen sind von der Ansicht-Symbolleiste verfügbar:

Schaltfläche	Menübefehl	Beschreibung
	Wählen	Klicken Sie auf diese Schaltfläche, um den Modus Wählen auszuwählen.
	Ansicht / Verschieben	Verschiebt die Ansichtsmitte
	Ansicht / Vergrößern	Vergrößert um den Faktor 2
	Ansicht / Verkleinern	Verkleinert um den Faktor 2
	Ansicht / Zoom-Ausdehnung	Vergrößert bis zur Modell-Ausdehnung
	Ansicht / Vorherige Ansicht	Vergrößert/verkleinert zur vorherigen Einstellung
	Ansicht / Zoom-Ansichten	Fügt die aktuelle Ansicht zu einer Liste gespeicherter Ansichten hinzu oder wählt eine zu bearbeitende Ansicht
	Ansicht / Layer	Bearbeitet die Sichtbarkeit von Layern
	Ansicht / Zusatzfenster	Öffnet das Zusatzfenster


Verknüpfungsmenüs

Sie können, wenn Sie sich in einem Graphikfenster befinden, die rechte Maustaste verwenden, um ein Verknüpfungsmenü einzusehen. Dies ist ein kontextabhängiges Menü mit verschiedenen Optionen, die abhängig von dem Kontext, in dem Sie die rechte Maustaste drücken, verfügbar sind.


Berichte ansehen

Die RoadLink-Software erzeugt eine Reihe unterschiedlicher Berichte. Ein Beispiel für einen Bericht ist der Regelquerschnittsbericht. Der Regelquerschnittsbericht zeigt die Stationsintervalle und die Namen der an verschiedenen Stationierungen entlang des Kurvenbandes angewandten Regelquerschnitte an.

Alle Berichte werden in Ihrem Bericht-Ordner (C:\ Trimble Geomatics Office\Projekte\xx\Reports…., wobei xx der Projektname ist), gespeichert.

Sie können den Bericht später ansehen, indem Sie ihn mit Microsoft Windows Explorer in diesem Ordner öffnen.


Titelleiste

Die Titelleiste erstreckt sich entlang des oberen Bildschirmbereichs oberhalb der Menüleiste. Sie enthält den Namen des aktuell gewählten Projekts.


Menüleiste

Die Menüleiste befindet sich unterhalb der Titelleiste. Sie enthält die folgenden Menüs:

Datei

Bearbeiten

Ansicht

Trasse

Extras

Fenster

Hilfe

Wenn das Menü “Extras” geöffnet ist, ist folgendes Menü verfügbar:

Regelquerschnitt-Editor

Einen Befehl wählen

Um einen Befehl aus einem Menü zu wählen, klicken Sie mit der Maus darauf.

Falls Sie es vorziehen, die Tastatur zu benutzen, drücken Sie Alt und den unterstrichenen Buchstaben, der dem von Ihnen gewünschten Menü entspricht. Drücken Sie daraufhin den unterstrichenen Buchstaben, der dem gewünschten Befehl entspricht, oder setzen Sie die Auf- und Abwärtspfeile ein, und drücken Sie Eingabe, um die Auswahl durchzuführen.


Tastaturverknüpfung

Sie können die Maus verwenden, um einen beliebigen Menübefehl zu wählen, auf den Sie von der Menüleiste aus zugreifen können. Sie können aber auch die Tastatur verwenden.

TIP: Für die meisten Verknüpfungen drücken Sie Alt, dann den ersten Buchstaben der Menübezeichnung und daraufhin den ersten Buchstaben des Befehls. Sie können zudem vertraute Microsoft Windows 95- und Microsoft Windows 98-Verknüpfungen für die gebräuchlichsten Befehle wie Neu, Öffnen, Speichern, Kopieren und Einfügen verwenden.


Statusleiste

Die Statusleiste zeigt eine Reihe von unterschiedlichen Meldungen an und stellt unmittelbares und präzises Feedback über den aktuellen Status der RoadLink-Software zur Verfügung.

Die Statusleiste wird im unteren Bereich des Graphik-Hauptfensters angezeigt.

Fensterausschnitt Meldungen

Der Fensterausschnitt Meldungen der Statusleiste zeigt Information über die Bedienung von RoadLink an.

Abhängig vom jeweiligen Vorgang:

  beschreibt dieser Fensterausschnitt Funktionen von Menüelementen, wenn diese hervorgehoben sind. Die Meldung “Erstellt eine neue Trasse” wird z. B. angezeigt, während der Befehl Datei / Neue Trasse hervorgehoben ist.

  zeigt dieser Fensterausschnitt Meldungen an, die die Funktionen von Schaltflächen der Symbolleiste beschreiben, sowie Sie diese wählen und bevor Sie sie freigeben. Die Meldung “Verschiebt Mitte von Zoom-Bereich” wird z. B. angezeigt, wenn Sie das Symbol Verschieben auf der Ansicht-Symbolleiste wählen.

Fensterausschnitt Koordinaten

Wenn sich die Maus innerhalb eines Graphikfensters befindet, werden die entsprechenden Koordinaten angezeigt.

Fensterausschnitt Ausdehnung

Dieser Fensterausschnitt zeigt die Breite und Höhe des Graphikfensters an, über dem sich die Maus befindet.

Fensterausschnitt Anzeige

In diesem Fensterausschnitt wird die Layeranzeige hervorgehoben, wenn ein Projekt einen oder mehrere versteckte Layer aufweist.

Fensterecke

Die Fensterecke läßt Sie die Größe des Graphik-Hauptfensters ändern.


Neu
Bibliothek / Neu

Verwenden Sie diesen Befehl, um eine neue Regelquerschnittsbibliothek für das Projekt zu erstellen.

Bibliotheksbezeichnung eingeben

Geben Sie im Dialogfeld Neue Regelquerschnittsbibliothek erstellen einen neuen Namen in das Feld Bibliotheksbezeichnung ein, um eine neue Bibliothek zu erstellen.

Klicken Sie auf OK, um eine neue Bibliothek zu erstellen. Jede neue Bibliothek, die erstellt wird, wird zur aktuellen Bibliothek.

Klicken Sie auf Abbrechen, um diese Option zu beenden.


Speichern
Bibliothek / Speichern

Verwenden Sie diesen Befehl, um eine Regelquerschnittsbibliothek zu speichern.

Die kompletten Regelquerschnitte werden in einer Regelquerschnittsbibliothek im Projektordner gespeichert. Die Regelquerschnittsbibliothek ist eine Datei mit Namen TEMPLANnnnn.DAT (wobei nnnn eine Zahl ist). Es besteht keine festgelegte Grenze für die Anzahl der Regelquerschnitte, die in jeder Regelquerschnittsbibliothek gespeichert werden können.


Löschen
Bibliothek / Löschen

Verwenden Sie diesen Befehl, um eine Regelquerschnittsbibliothek zu löschen.

Klicken Sie auf OK, um das Löschen der Bibliothek zu bestätigen.


Berichte
Bibliothek / Berichte

Verwenden Sie diesen Befehl, um einen Bericht über die aktuelle Regelquerschnittsbibliothek zu erzeugen.


Umbenennen
Bibliothek / Umbenennen

Verwenden Sie diesen Befehl, um die aktuelle Regelquerschnittsbibliothek umzubenennen. Geben Sie eine neue Bibliotheksbezeichnung in das Feld Bibliotheksbezeichnung ein.

Klicken Sie auf OK, um die aktuelle Bibliothek umzubenennen.


Bibliothek / System

Verwenden Sie diesen Befehl, um die voreingestellte System-Bibliothek durch die von Ihnen gewählte aktuelle Bibliothek zu ersetzen.

RoadLink bietet zu Beginn eine System-Regelquerschnittsbibliothek. Wenn Sie mit einem neuen Projekt beginnen, wird die System-Bibliothek in den Projektordner kopiert. Auf diese Weise steht die System-Bibliothek für alle Projekte zur Verfügung.


Menü "Bibliothek"
Menü ”Bibliothek”

Verwenden Sie das Menü “Bibliothek”, um die Regelquerschnittsbibliotheken zu verwalten.

Das Menü bietet die folgenden Befehle:

Neu

Speichern

Löschen

Berichte

Umbenennen

System


Trasse / Horizontal

Verwenden Sie diesen Befehl, um das Dialogfeld Horizontal zu öffnen, damit Sie die Bogen, Spiralen und Linien für das Kurvenband festlegen und bearbeiten können.

Das Fenster Planansicht wird geöffnet. Wenn ein Kurvenband existiert, wird es angezeigt. Sobald Sie das horizontale Kurvenband eingeben, erscheint es in diesem Fenster.


Dialogfeld Horizontal

Verwenden Sie das Dialogfeld Horizontal, um die Bogen, Spiralen und Linien, die das Kurvenband ausmachen, festzulegen und zu bearbeiten.

Kurvenbandbezeichnung

Sie können die Bezeichnung des Kurvenbands im Feld Kurvenbandbezeichnung bearbeiten.

SP / Elemente

Diese Register steuern die Eingabemethode für das horizontale Kurvenband.

Wenn Sie das Register SP wählen, können Sie das Kurvenband anhand der Schnittpunkte (SPe) eingeben. Die Schnittpunkte können zu Kurven bearbeitet werden.

Wenn Sie das Register Elemente wählen, können Sie das horizontale Kurvenband unter Verwendung der Option Einfügen als eine Reihe verbundener Punkt-, Linien-, Bogen-, und Spiralen-Elemente eingeben.

HINWEIS: Ein anfänglich mit Hilfe der Elemente-Methode festgelegtes Kurvenband kann später unter Verwendung der Methode SP bearbeitet werden, indem das Register SP in diesem Dialogfeld gewählt wird. Die einzige Ausnahme besteht, wenn eine Bogen-zu-Bogen-Spirale mit der Elemente-Methode eingegeben wurde. Es ist auch möglich, ein Kurvenband, das mit der SP-Methode eingegeben wurde, später mit der Elemente-Methode zu bearbeiten, indem das Register Elemente gewählt wird.

HINWEIS: Die Resultate der Bearbeitung eines horizontalen Kurvenbandes variieren, abhängig davon, ob das Kurvenband mit der SP- oder der Elemente-Methode festgelegt wurde. Weitere Informationen zur Bearbeitung horizontaler Kurvenbänder finden Sie unter Horizontale Kurvenbänder bearbeiten.

HINWEIS: Wenn Sie sich in einem Kurvenband durch ein Element bewegen, werden die Anfangs- und Endstation (Beginn Station und Ende Station) des Elements angezeigt. Wenn Sie jedoch das Kurvenband zur Zeit gerade bearbeiten, kann es vorkommen, daß die angezeigten Stationen nicht mit der zuletzt vorgenommenen Änderung aktualisiert werden.


Horizontale Kurvenbänder bearbeiten

 Siehe auch

Dieser Abschnitt zeigt, wie die Bearbeitung horizontaler Kurvenbänder mit der SP- oder Elemente-Methode die Kurvenbanddefinition beeinflussen kann.

SP-Methode

Bearbeiten Sie das Kurvenband mit der SP-Methode, wenn Sie nur ausgewählte SPe bearbeiten möchten. Sie können alle Werte, die die Kurve definieren, bearbeiten. Die Koordinaten für alle SPe werden beibehalten, einschließlich der Kurvendetails für nahegelegene Kurven. Verwenden Sie diese Option, um das Kurvenband auszugleichen und Hindernisse vor Ort zu umgehen.

Elemente-Methode

Bearbeiten Sie das Kurvenband mit der Elemente-Methode, wenn Sie ein ausgewähltes Element ändern und die Stations- und Koordinatenwerte für alle nachfolgenden Elemente um diese Änderungen aktualisieren möchten. Alle anderen Werte, die die nachfolgenden Elemente definieren, werden beibehalten.

SPe bearbeiten

Sie können sowohl mit der SP-Methode als auch mit der Elemente-Methode die Koordinaten, die die SPe definieren, mit der Option SPe bearbeiten ändern.

Wenn Sie SPe mit dieser Option bearbeiten, behält RoadLink die Koordinaten der Anfangs- und End-SPe, und, falls möglich, den Radius aller zugewiesenen Kurven bei. Alle verbleibenden SPe und Kurvendetails werden ausgeglichen und an die neue Geometrie angepaßt. Wenn die neue SP-Position eine Geometrie definiert, die die Neuzeichnung bestehender Kurven mit demselben Radius nicht erlaubt, wird diese Kurve entfernt.


Kurvenbandeingabe durch Schnittpunkte (SPe)

 Siehe auch

Wählen Sie das Register SP, um das Kurvenband anhand von Schnittpunkten (SPe) einzugeben.

Die Spurleiste zeigt die Gesamtzahl der Schnittpunkte im Projekt an, und der Schieber hebt den spezifischen SP hervor, den Sie gewählt haben. Die Werte, die in den Feldern erscheinen, beziehen sich auf den gewählten SP.

HINWEIS: Die im Dialogfeld verfügbaren Felder sind von den gewählten Optionen abhängig.

SP

Um einen SP zu wählen, geben Sie eine SP-Nummer in das Feld SP ein, oder verwenden Sie die Spurleiste.

HINWEIS: Während Sie die Kurvenbanddefinition durch Eingabe der Kurvendetails aufbauen, wird die Definition überprüft, um zu bestätigen, daß keine Kurvenüberlappung durch die Definition verursacht wurde. Wenn eine Überlappung auftritt, erscheint eine Warnmeldung.

Kurventyp

Das Feld Kurventyp definiert die horizontale Geometrie des Kurvenbandes.

Verwenden Sie die Liste, um eine Option zu wählen. Die verfügbaren Optionen sind:

Kreisförmig	Wenn Sie die Option Kreisförmig wählen, wird die kreisförmige Kurve durch ihren Radius, ihre Bogenlänge und Tangentenlänge definiert.
Spirale | Bogen | Spirale	Die Option Spirale | Bogen | Spirale (SBS) ist, abgesehen von der Länge Eingangsspirale und der Länge Ausgangsspirale, mit der Definition Kreisförmige Kurve vergleichbar.
Spirale | Spirale	Spirale | Spirale (SS)-Kurven sind mit SBS-Kurven vergleichbar, sie enthalten jedoch keine kreisförmige Bogenlänge und deswegen kein Spirale-zu-Bogen-Verhältnis. Die Eingangsspirale setzt sich fort, bis ihr Endradius dem angegebenen Radiuswert entspricht; die Ausgangsspirale startet unverzüglich und ist ein Spiegelbild der Eingangsspirale. Die Längen der Eingangs- und Ausgangsspirale (der Spirale Hinein und Spirale Hinaus, und demzufolge der Tangentenlängen) müssen in vollen SS-Kurven identisch sein.
Keine	Verwenden Sie die Option Keine dort, wo Sie eine zuvor definierte Kurve wieder in einen einfachen Schnittpunkt (SP) ändern möchten.
Radius

Geben Sie den erforderlichen Radius für die Kurve in das Feld Radius ein. Die Bogenlänge und Tangentenlänge für die Kurve werden berechnet und erscheinen in den entsprechenden Feldern.

Bogenlänge

Geben Sie die erforderliche Bogenlänge für die Kurve in das Feld Bogenlänge ein. RoadLink berechnet den entsprechenden Radius und die Tangentenlängen für die Kurve, und die Resultate erscheinen in den entsprechenden Feldern.

Tangentenlänge

Es gibt zwei Tangentenlängen-Felder. Das Feld Hinein zeigt die Eingangstangentenlänge an. Das Feld Hinaus zeigt die Ausgangstangentenlänge an. Die zwei Tangentenlängen sind für eine kreisförmige Kurve und SS-Kurve immer gleich.

Spiralenlänge

In den Feldern Spiralenlänge Hinein und Hinaus können Sie die Längen der Eingangs- und Ausgangsspiralen für die SBS- und SS-Kurven angeben. Sie können, falls erforderlich, unterschiedliche Werte für die Hinein- und Hinaus-Felder angeben. Sie können keine unterschiedlichen Werte für SS-Kurven angeben. Die Spiralenlänge ist immer kleiner als die äquivalente Tangentenlänge.

Abb. 1 erläutert die Merkmale einer SBS-Kurve:

Abb. 1 : Merkmale einer SBS-Kurve

Abb. 1 ist in der folgenden Tabelle beschrieben.

Schlüssel	Beschreibung	Schlüssel	Beschreibung
1	Tangente-zu-Spirale	7	Radius (R)
2	Spiralenlänge	8	Position Kreisförmiger Bogen-zu-Spirale
3	Tangentenlänge	9	Spiralenlänge
4	Position Spirale-zu-Kreisförmigem Bogen	10	Spirale-zu-Tangente
5	Bogenlänge	11	Delta Winkel
6	Schnittpunkt (SP)	12	Ablenkungswinkel
Einfügen

Klicken Sie auf Einfügen, oder drücken Sie die Taste Einf, um SPe einzufügen. Das Dialogfeld SPe einfügen wird geöffnet. Nachdem Sie einen SP eingefügt haben, können Sie weitere SPe einfügen.

HINWEIS: Gemäß Voreinstellung werden neue Punkte nach dem aktuell gewählten Schnittpunkt eingefügt. Folglich können neue Punkte durch die Änderung des aktuellen Schnittpunktes an einer beliebigen Stelle auf dem Kurvenband hinzugefügt werden. Sie können zudem das Kontrollkästchen Nach aktuellem SP deaktivieren. Dadurch wird ein SP vor dem aktuellen SP eingefügt.

Löschen

Klicken Sie auf Löschen, oder drücken Sie die Taste Entf, um den aktuell gewählten SP zu löschen. Sie werden aufgefordert, zu bestätigen, daß Sie das aktuell gewählte Element löschen möchten. Sie können zudem die Option wählen, um alle SPe zu löschen.

Anwenden

Klicken Sie auf Anwenden, um die von Ihnen vorgenommenen Änderungen und Bearbeitungen anzuwenden. Dieser Vorgang tritt unverzüglich in Kraft.

Route

Wählen Sie diese Option, um eine Route aus Linien oder Punkte zu definieren.

Berichte

Klicken Sie auf Berichte, um einen Bericht des Kurvenbands zu erstellen.

TIP: Klicken Sie auf Berechn., um:

 die Koordinaten und die Höhen für einen eingegebenen Stationswert und Offsetwert zu berechnen

 Station und Offset für die eingegebenen Koordinatenwerte zu berechnen

SPe bearbeiten

Klicken Sie auf SPe bearbeiten, um einen individuellen Schnittpunkt oder einen Abschnitt des Kurvenbands zu verschieben. Das Dialogfeld Schnittpunkte bearbeiten (SPe bearbeiten) erscheint.


Route wählen

Wählen Sie diese Option, um ein horizontales Kurvenband entweder aus einem aus einer DXF-Datei importierten Liniennetz oder aus einem Punktbereich, der von Trimble Geomatics Office übertragen oder aus einer DXF-Datei importiert wurde, zu definieren.

Wählen Sie das Register Linien, um die Route aus dem Liniennetz zu definieren.

Wählen Sie das Register Bereich, um die Route aus einem Punktebereich zu definieren.


Berechn.

Verwenden Sie diese Option, um die Koordinaten und die Höhe für eine eingegebene Station und ein eingegebenes Offset zu berechnen, oder um die Station und das Offset für eingegebene Koordinatenwerte zu berechnen.

Koordinate berechnen

Wählen Sie die Option Koordinate berechnen, und geben Sie einen Stations- und Offsetwert ein. (Der Stationswert muß innerhalb des Stationsbereichs für die Trasse liegen).

Klicken Sie auf Berechn. Die Felder Hochwert, Rechtswert und Höhe werden mit den berechneten Werten aktualisiert.

HINWEIS: Die Höhe ist für die Trassenoberfläche und erscheint nur im Bericht, wenn Regelquerschnitte zugewiesen wurden oder das Offset 0,000 beträgt.

Station und Offset berechnen

Wählen Sie die Option Station und Offset berechnen, und geben Sie die Hoch- und Rechtswerte ein, oder verwenden Sie die graphische Auswahl, um die Hoch- und Rechtswerte einzugeben.

Klicken Sie auf Berechn. Die Felder Station und Offset werden mit den berechneten Werten aktualisiert.


 Linien

 Siehe auch

Verwenden Sie die graphische Auswahl, um den Anfang und das Ende des Liniennetzes zu wählen, das die entsprechende Route definiert. Wenn die Punkte, die das Liniennetz definieren, Höhen haben, verwendet die Software sie zur Definition des vertikalen Kurvenbandes. Wenn die Software jedoch einen Punkt ohne Höhe findet, wird das vertikale Kurvenband beendet.

Wenn es mehrere Lösungen gibt, können Sie die entsprechende Route im Dialogfeld Linie wählen auswählen.


Linie wählen

 Siehe auch

Verwenden Sie die graphische Auswahl, um das Ende des Liniennetzes zu wählen, das die entsprechende Route definiert.


Bereich

 Siehe auch

Geben Sie den Punktbereich für die Punkte ein, die die Trasse definieren. Wenn die Punkte Höhen haben, verwendet die Software sie, um das vertikale Kurvenband zu definieren. Findet die Software einen Punkt ohne Höhe, wird das vertikale Kurvenband beendet.


Trasse importieren

 Siehe auch

Wenn die Datei verschiedene Trassen enthält, verwenden Sie diese Option, um die von Ihnen gewünschte Trasse zu importieren.

HINWEIS: Sie können nur jeweils eine Trasse importieren.


Kurvenbandeingabe durch Elemente

Wählen Sie das Register Elemente, um das Kurvenband als eine Reihe verbundener Punkt-, Linien-, Bogen-, und Spiralen-Elemente einzugeben.

Die Felder, die in diesem Register verfügbar sind, sind von den gewählten Optionen abhängig.

Ein anfänglich mit der Elemente-Methode eingegebenes Kurvenband kann später mit der SP-Methode bearbeitet werden, indem Sie das Register SP in diesem Dialogfeld wählen. Die einzige Ausnahme besteht, wenn eine Bogen-zu-Bogen-Spirale mit der Elemente-Methode eingegeben wurde. Es ist auch möglich, ein mit der SP-Methode eingegebenes Kurvenband später mit der Elemente-Methode zu bearbeiten, indem das Register Elemente gewählt wird.

HINWEIS: Das Resultat der Bearbeitung horizontaler Kurvenbänder variiert, abhängig davon, ob das Kurvenband mit der SP- oder mit der Elemente-Methode bearbeitet wurde. Weitere Informationen finden Sie unter Horizontale Kurvenbänder bearbeiten.

Wenn ein Kurvenband mit Hilfe der Elemente-Methode eingegeben wird, ist es notwendig, das Kurvenband zu ‘verankern’. Geben Sie dazu das erste Element als Punkt an, dem ein Linienelement (das eine Länge von Null haben kann) unmittelbar folgt.

Diese Kombination von Elementen bietet eine feste Position und Orientierung für das Kurvenband und dient als Berechnungsbasis für die Positionen der anderen Elemente, die das Kurvenband ausmachen.

Elemente zu einer Definition hinzufügen

Wenn eine neue Kurvenbanddefinition gestartet wird, wird ein voreingestelltes Punktelement als erstes Element in der Definition angezeigt. Dieser voreingestellte Elementtyp kann geändert werden. Die verfügbaren Elementtypen sind:

Punkt, Linie, Bogen und Spirale.

Nachdem Sie den ersten Punkt festgelegt haben, können Sie damit beginnen, weitere Elemente zur horizontalen Definition hinzuzufügen. Die verfügbaren Elementtypen sind: Linie, Bogen und Spirale.

Führen Sie die nachfolgenden Schritte aus, um diese zusätzlichen Elemente hinzuzufügen:

  Drücken Sie die Tabulator-Taste, wenn Sie sich im letzten aktiven Feld in einer Reihe befinden.

  Klicken Sie auf Einfügen

Das neue Element wird nach dem aktuell gewählten Element eingefügt. Sie können bei der Einfügung jedes neuen Elements den Elementtyp wählen.

TIP: Wenn die Elemente hinzugefügt werden, zeigen die Felder Hochwert / Rechtswert und Station die Koordinaten und den Stationswert am Ende jedes Elements an. Verwenden Sie diese Funktion, um die korrekte Eingabe des Elements zu bestätigen.

Einfügen

Klicken Sie auf Einfügen, oder drücken Sie die Taste Einf, um ein neues Element einzufügen.

HINWEIS: Gemäß Voreinstellung werden neue Elemente nach dem aktuell hervorgehobenen Element eingefügt. Heben Sie das Element unmittelbar vor dem Element hervor, das Sie einfügen möchten.

Löschen

Klicken Sie auf Löschen, um bestehende Elemente zu löschen. Klicken Sie auf Löschen, oder drücken Sie die Taste Entf, um das aktuell gewählte Element im Anschluß an die Bestätigung, daß Sie dieses Element löschen möchten, zu löschen. Sie können zudem diese Option wählen, um alle Elemente zu löschen.

Anwenden

Klicken Sie auf Anwenden, um die von Ihnen vorgenommenen Änderungen und Bearbeitungen anzuwenden. Dieser Vorgang tritt unverzüglich in Kraft.

Berichte

Klicken Sie auf Berichte, um einen Bericht des Kurvenbands zu erstellen.

TIP: Klicken Sie auf Berechn., um:

  die Koordinaten und die Höhen für einen eingegebenen Stations- und Offsetwert zu berechnen

  Station und Offset für eingegebene Koordinatenwerte zu berechnen

SPe bearbeiten

Klicken Sie auf SPe bearbeiten, um einen individuellen Schnittpunkt oder einen Abschnitt des Kurvenbands zu verschieben. Das Dialogfeld Schnittpunkte bearbeiten (Spe bearbeiten) erscheint.

HINWEIS: Falls das Kurvenband anfänglich unter Verwendung der Elemente-Methode definiert wurde und eine Bogen-zu-Bogen-Spirale einschließt, können Sie das Kurvenband nicht verschieben.

HINWEIS: Für eine Spirale, die zwei Bogen miteinander verbindet (eine sog. offene oder Verbundspirale), sind die Spiralenkoordinaten solange inkorrekt, bis der zweite Bogen hinzugefügt wird.


Stationskennungen

Spezielle Stationskennungen zeigen Beschriftungen im Graphikfenster an. Die Stationskennungen werden in der folgenden Tabelle beschrieben.

Kennung	Beschreibung

RS	Am Trassenanfang. Dies ist die Anfangsstation für die Trasse.

RE	Am Trassenende. Dies ist die Endstation oder maximale Station für die Trasse.

TS	Bei Tangente/Spiralen-Position. Dies ist die Station des Punktes am Beginn einer Eingangsspirale.

SC	Bei Spirale/Kreisförmiger Bogen-Position. Dies ist die Station des Punktes in einer SBS-Kurve am Ende der Eingangsspirale und dem Beginn des kreisförmigen Bogenabschnittes der Kurve.

CS	Bei Kreisförmiger Bogen/Spirale-Position. Dies ist die Station des Punktes in einer SBS-Kurve am Ende des kreisförmigen Bogenabschnittes der Kurve und dem Beginn der Ausgangsspirale.

ST	Bei Spirale/Tangenten-Position. Dies ist die Station des Punktes am Ende einer Ausgangsspirale.

PC	Bei Gerade/Kreisförmiger Bogen-Position. Dies ist die Station des Punktes in einer kreisförmigen Kurve am Beginn des kreisförmigen Bogens.

PT	Bei Gerade/Kreisförmiger Bogen-Position. Dies ist die Station des Punktes in einer kreisförmigen Kurve am Ende des kreisförmigen Bogens.


Dialogfeld Schnittpunkte bearbeiten

Verwenden Sie das Dialogfeld Schnittpunkte bearbeiten (Spe bearbeiten), um ein bestehendes Kurvenband oder einen Abschnitt eines Kurvenbands zu verschieben.

Felder, die nicht verfügbar sind, erscheinen grau unterlegt.

HINWEIS: Wenn das Kurvenband anfänglich unter Verwendung der Elemente-Methode definiert wird und eine Bogen-zu-Bogen-Spirale einschließt, können Sie das Kurvenband nicht verschieben.

Bearbeiten mit

Wählen Sie die von Ihnen benötigte Option aus der Gruppe Bearbeiten mit.

Delta

Klicken Sie auf die Option Delta, um die Position der Schnittpunkte (SPe) durch die Angabe von Delta-Positionen zu verschieben. Die Felder Delta Rechts und Delta Hoch unterhalb der Gruppe Bearbeiten mit werden mit dieser Option verfügbar.

Geben Sie die Strecke in Richtung Osten und die Strecke in Richtung Norden, um die das Kurvenband verschoben werden soll, in die Felder Delta Rechts und Delta Hoch ein.

Sie können eine kontinuierliche, sequentielle Reihe von Schnittpunkten wählen, indem Sie einen individuellen Schnittpunkt in der Tabelle wählen und mit der Maus ziehen. Als Alternative können Sie die Umschalttaste gedrückt halten und mit der Maus auf den letzten SP in dem gewünschten Bereich klicken.

TIP: Verwenden Sie die Felder Delta Rechts und Delta Hoch als berechnete Felder. Heben Sie dazu die Felder hervor, wählen Sie dann die aktuelle Position eines SP und daraufhin die neue Position vom Bildschirm. RoadLink berechnet die Werte für die Felder Delta Rechts und Delta Hoch und fügt diese Werte in die Felder ein.

Delta Rechts

Verwenden Sie dieses Feld, um den Rechtswert für die Verschiebung festzulegen. Dieses Feld ist nur für die Option Bearbeiten mit Delta verfügbar.

Delta Hoch

Verwenden Sie dieses Feld, um den Hochwert für die Verschiebung festzulegen. Dieses Feld ist nur für die Option Bearbeiten mit Delta verfügbar.

Position

Klicken Sie auf die Option Position, um die Position eines SP zu verschieben, indem Sie die Koordinatenwerte bearbeiten. Sie können diese Felder manuell bearbeiten oder die graphische Auswahl verwenden, indem Sie den Mauszeiger außerhalb des Dialogfelds positionieren.

TIP: Mit der Option Bearbeiten mit Position befinden Sie sich automatisch im Bearbeitungsmodus.

Tabelle

Die Tabelle zeigt die Werte des gewählten SP (oder der gewählten SPe) an. Verwenden Sie die Bildlaufleisten, um durch die Werte zu rollen.

Anwenden

Klicken Sie auf Anwenden, um die neuen Werte auf die Punkte anzuwenden.

HINWEIS: RoadLink zeigt ein farbiges Dreieckssymbol in einem Kästchen auf dem Bildschirm an, um die neuen Positionen des SP (oder der SPe) anzugeben, bevor die Punkte tatsächlich verschoben werden. Die Dreieckssymbole sind zusätzlich zu den in Kästchen befindlichen, farbigen Kreuzsymbolen vorhanden, die die aktuelle Position des gewählten SP (oder der gewählten SPe) anzeigen.


Vertikal
Trasse / Vertikal

 Siehe auch

Verwenden Sie diesen Befehl, um das Dialogfeld Vertikal zu öffnen. Verwenden Sie das Dialogfeld Vertikal, um die graphische, vertikale Eingabe des Kurvenbands durchzuführen.

Das Fenster Profilansicht wird geöffnet. Wenn ein Kurvenband existiert, wird es angezeigt. Sobald Sie das vertikale Kurvenband eingeben, erscheint es in diesem Fenster.


Dialogfeld Vertikal

 Siehe auch

Verwenden Sie dieses Dialogfeld, um die graphische, vertikale Eingabe des Kurvenbands durchzuführen.

Kurvenbandbezeichnung

Das Feld Kurvenbandbezeichnung zeigt die aktuelle Kurvenbandbezeichnung an.

Horizontale Kurvenmarkierungen

Wählen Sie das Kontrollkästchen Markierungen, um die Anzeige von Markierungen (Symbolen) im Längsprofil-Kurvenband zu aktivieren. Diese Markierungen zeigen die Schlüsselmerkmale jeder horizontalen Kurve an. Schlüsselmerkmale schließen Bogenpositionen (durch farbige Symbole verdeutlicht) und Spiralenpositionen (durch schwarze Symbole verdeutlicht) ein.

Vertikaler Schnittpunkt (VSP)

Das Feld VSP zeigt den aktuellen VSP an. Um einen VSP zu wählen, geben Sie eine VSP-Nummer in dieses Feld ein. Die Spurleiste zeigt die Gesamtzahl der VSPe im Projekt an. Der Schieber hebt den gewählten VSP hervor. Die Werte, die in den Feldern erscheinen, beziehen sich auf diesen VSP.

HINWEIS: Wenn Sie die vertikale Kurvenbanddefinition durch Eingabe der Kurvendetails an den einzelnen VSP festlegen, überprüft RoadLink die Definition, um zu bestätigen, daß keine Kurvenüberlappung durch die Definition verursacht wurde. Wenn eine Überlappung auftritt, erscheint eine Warnmeldung.

Kurventyp

Die verfügbaren Optionen sind:

Keine	Die Option Keine fügt keine Kurve am VSP ein. Klicken Sie auf Details, um die Felder Station, Höhe, Gefälle hinein und Gefälle hinaus anzusehen oder zu bearbeiten.
Sym. Parabel	Die Option Sym. Parabel fügt eine symmetrische Parabel als vertikale Kurve ein. Eine symmetrische Parabel wird durch eine Länge definiert. Das Feld Länge ermöglicht Ihnen die Eingabe der Länge der symmetrischen Parabel. Klicken Sie auf Details, um die Felder Station, Höhe, Gefälle hinein und Gefälle hinaus anzusehen und zu bearbeiten.
Asym. Parabel	Die Option Asym. Parabel fügt eine asymmetrische Parabel als vertikale Kurve ein. Eine asymmetrische Parabel wird durch eine Eingangs- und Ausgangslänge (Länge Hinein und eine Länge Hinaus) definiert. Die Felder Länge Hinein und Länge Hinaus ermöglichen Ihnen die Eingabe der Eingangs- und Ausgangslängen der asymmetrischen Parabel. Klicken Sie auf Details, um die Felder Station, Höhe, Gefälle hinein und Gefälle hinaus anzusehen und zu bearbeiten.
Kreisförmig	Die Option Kreisförmig fügt eine kreisförmige Kurve als vertikale Kurve ein. Eine kreisförmige Kurve wird durch einen Radius definiert. Das Feld Radius ermöglicht Ihnen die Eingabe des Radius der kreisförmigen Kurve. Klicken Sie auf Details, um die Felder Station, Höhe, Gefälle hinein und Gefälle hinaus anzusehen und zu bearbeiten.
HINWEIS: Auf einem neuen vertikalen Kurvenband kehrt die Option zur Voreinstellung Keine zurück.

HINWEIS: Die im Dialogfeld verfügbaren Felder sind von dem gewählten Kurventyp abhängig. Felder, die nicht verfügbar sind, erscheinen grau unterlegt.

Länge

Verwenden Sie das Feld Länge, um die für die symmetrische Parabel verwendete Länge anzusehen und zu bearbeiten.

Länge Hinein

Verwenden Sie das Feld Länge Hinein, um die für die asymmetrische Parabel verwendete Eingangslänge anzusehen und zu bearbeiten.

Länge Hinaus

Verwenden Sie das Feld Länge Hinaus, um die für die asymmetrische Parabel verwendete Ausgangslänge anzusehen und zu bearbeiten.

Radius

Verwenden Sie das Feld Radius, um den Radiuswert, der eine kreisförmige Kurve definieren soll, anzusehen und zu bearbeiten.

Details

Klicken Sie auf Details, um weitere Kurvendetails anzusehen.

Station

Das Feld Station zeigt die Station des ausgewählten vertikalen Schnittpunkts an.

HINWEIS: Es ist nicht möglich, einen Stationswert so zu bearbeiten, daß dieser geringer ist, als die Station des vorherigen VSP oder größer als die Station des nachfolgenden VSP.

Höhe

Das Feld Höhe zeigt die Höhe des ausgewählten vertikalen Schnittpunkts an.

HINWEIS: Um die aktuellen Werte der Felder Station oder Höhe während der Bearbeitung der Werte Gefälle hinein und Gefälle hinaus beizubehalten, vergewissern Sie sich, daß das entsprechende Kontrollkästchen ausgewählt wurde.

Gefälle hinein

Das Feld Gefälle hinein zeigt das Gefälle vom vorherigen VSP zum aktuellen VSP an. Sie können dieses Feld bearbeiten und es verwenden, um ein neues Gefälle zum aktuellen VSP anzugeben.

Wenn Sie einen neuen Gefälle hinein-Wert eingeben, müssen Sie entweder das Kontrollkästchen Station oder das Kontrollkästchen Höhe wählen. Die Felder Station und Höhe, Gefälle Hinein und Gefälle hinaus werden mit den neuen Werten aktualisiert, die mit dem geänderten Gefällewert assoziiert sind.

Wenn der erste VSP der aktuell gewählte VSP ist, zeigt das Feld Gefälle hinein 0% an und kann nicht bearbeitet werden.

Gefälle hinaus

Das Feld Gefälle hinaus zeigt das Gefälle vom aktuellen VSP zum nächsten VSP an. Sie können dieses Feld bearbeiten und es verwenden, um ein neues, vom aktuellen VSP ausgehendes Gefälle anzugeben. Wenn Sie einen neuen Gefälle hinaus-Wert eingeben, müssen Sie entweder das Kontrollkästchen Station oder das Kontrollkästchen Höhe wählen. Die Felder Station und Höhe, Gefälle hinein und Gefälle hinaus werden mit den neuen Werten aktualisiert, die mit dem geänderten Gefällewert assoziiert sind.

Wenn der letzte VSP der aktuell gewählte VSP ist, zeigt das Feld Gefälle hinaus 0% an und kann nicht bearbeitet werden.

Einfügen

Verwenden Sie das Dialogfeld VSP einfügen, um neue VSPe einzufügen. Um einen neuen VSP einzufügen, geben Sie die Stations- und Höhendetails in die Felder ein, oder wählen Sie eine Position vom Bildschirm.

Löschen

Um den hervorgehobenen VSP zu löschen, klicken Sie auf Löschen, oder drücken Sie die Taste Entf. Der Bildschirm wird aktualisiert, um die Änderung widerzuspiegeln. Als Alternative können Sie einfach alle VSPe löschen.

Anwenden

Klicken Sie auf Anwenden, um den Bildschirm zu aktualisieren und die Bearbeitungen anzuzeigen.

Berichte

Klicken Sie auf Berichte, um einen Bericht über die für das Kurvenband definierten vertikalen Kurven zu erstellen.

TIP: Klicken Sie auf Berechn., um die Koordinaten und Höhen für den eingegebenen Stationswert zu berechnen.

VSPe bearbeiten

Klicken Sie auf VSPe bearbeiten, um ein bestehendes vertikales Kurvenband oder einen Abschnitt eines Kurvenbandes zu verschieben. Das Dialogfeld VSPe bearbeiten erscheint.


Regelquerschnitte
Trasse / Regelquerschnitte

 Siehe auch

Verwenden Sie diesen Befehl, um das Dialogfeld Regelquerschnitte zu öffnen. In diesem Dialogfeld können Sie die Regelquerschnitte an festgelegten Stationen auf das horizontale Kurvenband anwenden. Wenden Sie den erstellten Regelquerschnitt auf die rechte und linke Seite eines Kurvenbandes an.


Dialogfeld Regelquerschnitte

Verwenden Sie das Dialogfeld Regelquerschnitte, um die Regelquerschnitte an bestimmten Stationen auf das horizontale Kurvenband anzuwenden. Wenden Sie den erstellten Regelquerschnitt auf die rechte und linke Seite des Kurvenbandes an.

Aktuelle Regelquerschnittsbibliothek

Verwenden Sie die angezeigte, aktuelle Regelquerschnittsbibliothek, oder wählen Sie eine Regelquerschnittsbibliothek aus der Liste.

Beginn Station

Verwenden Sie die Spalte Beginn Station (Beg. Station) in der Gruppe Stationsintervalle, um die Anfangsstation für die Regelquerschnittszuweisung festzulegen. Eine Trasse kann aus einer Reihe von Anfangsstationsbereichen bestehen.

Einfügen

Klicken Sie auf Einfügen, um eindeutige Stationseinträge einzufügen.

Um eine neue Reihe für eine neue Anfangsstation in die Tabelle einzufügen, heben Sie ein Feld in der Reihe unmittelbar oberhalb der neuen Reihe, die Sie erstellen möchten hervor, und klicken Sie auf Einfügen.

Löschen

Klicken Sie auf Löschen, um eine hervorgehobene Reihe aus der Tabelle zu löschen.

Linker Regelquerschnitt und Rechter Regelquerschnitt

Wählen Sie aus der Liste der verfügbaren Regelquerschnitte den linken oder rechten Regelquerschnitt, den Sie der aktuellen Anfangsstation zuweisen möchten. Sie müssen zuvor allerdings den(die) Regelquerschnitt(e) unter Verwendung des Befehls Extras / Regelquerschnitt-Editor erstellt haben. Die dem Kurvenband zugeordneten Regelquerschnitte können an gewählten Stationen entlang der Trasse unterschiedlich sein.

Der Stationswert zeigt, daß die gewählten Regelquerschnitte an der, und von der gewählten Station anzuwenden sind.

TIP: Verwenden Sie die Bildlaufleiste, um alle Einträge der Regelquerschnittszuordnungen anzusehen.

HINWEISE:

Alle in einer Trassendefinition verwendeten Regelquerschnitte müssen sich in derselben Bibliothek befinden. Das heißt, Sie können für jede Trasse nur eine Regelquerschnittsbibliothek verwenden.

Wenn Sie das Namensfeld Beginn Station wählen, gibt ein Symbol auf dem Bildschirm die Position des gewählten Kurvenbandes an. Wenn einer Trasse ein Regelquerschnitt zugeordnet wurde, und dieser Regelquerschnitt nachfolgend unter Verwendung der Option Extras / Regelquerschnitt-Editor umbenannt oder gelöscht wird, muß der Regelquerschnitt neu zugeordnet werden.

Das Beispiel-Kurvenband mit der assoziierten Tabelle zeigt, wie die Regelquerschnittszuordnungen einschließlich der System-Regelquerschnitte <Keine> und <Interpolieren> durchgeführt werden können, um eine benötigte Kurvenbanddefinition zu erstellen.

TIP: Klicken Sie auf Abbrechen, um ohne Speichern zu beenden.

Berichte

Klicken Sie auf Berichte, um einen Bericht der Regelquerschnittszuordnungen für die verschiedenen Stationen zu erstellen.

Alle löschen

Klicken Sie auf Alle löschen, um alle Regelquerschnittszuordnungen zu löschen.


Überhöhung
Trasse / Überhöhung

 Siehe auch

Verwenden Sie diesen Befehl, um Überhöhungs- und Ausweitungswerte auf eine Trasse anzuwenden.

Schnittpunkt (SP)

Wählen Sie den Schnittpunkt der zu überhöhenden Kurve. Ein farbiges Symbol zeigt den Mittelpunkt der gewählten Kurve an.

Verwenden Sie die Spurleiste, oder geben Sie eine SP-Nummer in das Feld SP ein, um einen bestehenden SP zu wählen.

Wenn dem SP keine Kurve zugeordnet ist, kann keine Überhöhung durch Parameter zugeordnet werden, und die Felder sind nicht verfügbar.

Kurventyp

Dieses Feld ist ein reines Anzeigefeld und zeigt den Kurventyp der gewählten Kurve an.

Drehpunkt

Verwenden Sie das Feld Drehpunkt, um die Drehpunktoption für die Überhöhung für jede Position in der Überhöhungstabelle zu wählen. Die verfügbaren Optionen sind Kuppe, Links und Rechts.

Wenn Sie z. B. nicht möchten, daß der linke Rand der Trassenoberfläche geneigt sein soll, wenn die Überhöhung auf die Kurven angewendet wird, können Sie festlegen, daß der Drehpunkt für alle Überhöhungswerte, an denen die Querneigung auf der rechten Trassenseite die normale Querneigung für die Trassenoberfläche überschreitet, der linke Rand sein soll.

Markierungen

Wählen Sie das Kontrollkästchen Markierungen, um die Schlüsselpunkte der horizontalen Kurvendefinition hervorzuheben. Die Schlüsselpunkte werden als Symbole in der Planansicht angezeigt. Die Markierungen sind wie folgt plaziert:

Spirale | Bogen | Spirale (SBS) und Spirale | Spirale	Berührungspunkt Spirale/Bogen
	Berührungspunkt Spirale/Linie
Kreisförmige Kurven	Berührungspunkt Bogen/Linie
HINWEIS: Bevor Überhöhungswerte auf eine Kurve angewendet werden, werden die Enden der Linie markiert, die in die Kurve führen und von der Kurve ausgehen, wenn das Kontrollkästchen Markierung gewählt ist. Wenn Überhöhungswerte angewandt wurden, werden zusätzliche Markierungen an den Positionen plaziert, an denen die Überhöhung beginnt und endet.

Autom. Einfügung

Verwenden Sie diese Option, um Überhöhungen durch die Eingabe von Parametern anzuwenden. Diese variieren in Abhängigkeit vom Kurventyp. Geben Sie für eine Spirale | Bogen | Spirale-Kurve folgendes ein:

Maximale Überhöhung:	Geben Sie den maximalen Überhöhungswert für die Kurve ein.

Nicht überhöhte Querneigung:	Geben Sie den Wert der Trassenquerneigung vor der Anwendung der Überhöhung ein.

Geben Sie für eine kreisförmige Kurve die maximale Überhöhung und die nichtüberhöhten Querneigungswerte wie vorstehend beschrieben und zusätzlich folgendes ein:

Ablauf % in Kurve, Hinein/Hinaus 	Geben Sie den Prozentsatz der Ablauflänge ein, die für die Felder Hinein und Hinaus innerhalb der Kurve liegt.

Ablauflänge Hinein/Hinaus	Geben Sie die Ablauflänge, die in die Kurve (Hinein) und aus der Kurve (Hinaus) führt, ein.

Station

Die Spalte Station zeigt die Stationen für die nächstgelegenen Überhöhungs- und Ausweitungswerte an.

Überhöhung Links und Rechts

Die Spalten Überhöhung Links und Rechts zeigen die Überhöhungswerte für die nahegelegenen Stationen auf der linken und rechten Trassenseite an.

Ausweitung Links und Rechts

Die Spalten Ausweitung Links und Rechts zeigen die Ausweitungswerte für die nahegelegenen Stationen auf der linken und rechten Trassenseite an.

Drehpunkt

Verwenden Sie die Spalte Drehpunkt, um die Voreinstellungsposition für den Drehpunktvorgang der Überhöhungstabelle zu bearbeiten. Die verfügbaren Optionen sind Kuppe, Links und Rechts.

Einfügen

Klicken Sie auf Einfügen, um eine neue Reihe in der Überhöhungsdefinition zu erstellen. Die Reihe wird unmittelbar nach der Reihe mit dem aktuell hervorgehobenen Feld erstellt. Die Überhöhungsgraphiken werden automatisch aktualisiert.

Löschen

Klicken Sie auf Löschen, um die Reihe mit dem aktuell hervorgehobenen Feld zu löschen. Klicken Sie auf Anwenden, um die Überhöhungsgraphiken zu aktualisieren.

Anwenden

Klicken Sie auf Anwenden, um die Überhöhungswerte an den entsprechenden Stationen bei der Überhöhungseingabe durch Parameter zu berechnen.

Berichte

Klicken Sie auf Berichte, um einen Bericht über die auf das horizontale Kurvenband angewandte Überhöhung zu erstellen.

Alle löschen

Klicken Sie auf Alle löschen, um alle Überhöhungseingaben für die Trasse zu löschen.

SP löschen

Klicken Sie auf SP löschen, um die mit dem aktuellen SP assoziierten Überhöhungseinträge zu löschen.

TIP: Wenn Sie einen Überhöhungs- oder Ausweitungswert zwischen bekannten Werten interpolieren möchten, klicken Sie auf Einfügen, um eine neue Reihe einzufügen. Heben Sie das Feld hervor, das berechnet werden soll. Drücken Sie Entf und dann die Taste [Tab], um sich zum nächsten Feld zu bewegen. Im Feld wird <Berechnet> angezeigt. Dies weist darauf hin, daß der Wert aus den nächstliegenden Werten interpoliert wird. Erstellen Sie einen Bericht, um den tatsächlichen Wert zu ermitteln.

HINWEIS: Alle Einträge, die nicht mit dem aktuellen SP assoziiert sind, sind grau unterlegt.

Graphikfenster

Das Überhöhungsdiagramm im Graphikfenster ist eine graphische Darstellung der Überhöhung. Sie können durch das Fenster rollen, um die wahre Station und die Überhöhungsrate anzeigen zu lassen. Die Graphik ändert sich, um alle von Ihnen vorgenommene Bearbeitungen der Überhöhungsdefinition anzuzeigen, und bietet visuelles Feedback zu den vorgenommenen Bearbeitungen.

TIP: Wenn ein SP ausgewählt wird, werden die Überhöhungsansicht und Überhöhungstabelle aktualisiert, um den ausgewählten SP anzuzeigen. Um die aktuelle Ansicht beizubehalten, klicken Sie mit der rechten Maustaste im Fenster Überhöhungsansicht, und wählen Sie die Option Ansicht beibehalten aus dem Verknüpfungsmenü. Dies ist nützlich, wenn Sie durch die Tabelle rollen möchten, während Sie sich die Zoom-Ausdehnung der Überhöhungsgraphik ansehen.

Die Überhöhungsgraphik reflektiert die Werte, die in der Tabelle angezeigt werden.

TIP: Klicken Sie auf Anwenden, um die Überhöhungsgraphik nach der Bearbeitung der Überhöhungswerte zu aktualisieren.


Trasse / Profile

 Siehe auch

Verwenden Sie diesen Befehl, um berechnete Querprofile anzusehen und den angewandten Entwurf zu bestätigen. RoadLink bietet ein Graphikfenster, das das Querprofil an der gewählten Station anzeigt. Verwenden Sie die Spurleiste, um sich entlang der Trasse zu bewegen und eine Station zu wählen. Als Alternative verwenden Sie die Tasten Bild-auf oder Bild-ab, oder geben Sie einen Stationswert in das Feld Station ein.

TIP: Der eingegebene Stationswert muß zwischen den Anfangs- und Endwerten für die Trasse liegen. Wenn ein gültiges vertikales Kurvenband und ein Regelquerschnitt für die eingegebene Station existiert, wird das berechnete Querprofil angezeigt.

HINWEIS: Klicken Sie auf Berichte, um einen Bericht über Offset, Höhe und Code für jeden Knoten im aktuellen Querprofil und die Querneigung für jedes Regelquerschnittselement zu erstellen.

TIP: Klicken Sie mit der rechten Maustaste im Fenster Querprofilansicht, und wählen Sie "Ansicht beibehalten" aus dem Verknüpfungsmenü, um den aktuellen Ansichtsmaßstab für die nachfolgenden Querprofile beizubehalten.

Die Statusleiste im Graphikfenster zeigt an, welche Station (und Profilnummer) gerade gewählt ist. Die Gesamtzahl der verfügbaren Stationen erscheint ebenfalls.


Trasse / Liniennetz für Trasse anzeigen

 Siehe auch

Verwenden Sie diesen Befehl, um das Liniennetz, das die Querprofile verbindet, anzusehen. Verwenden Sie das Liniennetz, um die Trassendefinition zu bestätigen.

HINWEIS: Verwenden Sie die Option Ansicht / Layer, um das Liniennetz für die Trasse auszublenden. Die Layer-Bezeichnung entspricht der Trassenbezeichnung.

HINWEIS: Für Querprofildaten, die aus einer Kurvenbanddefinitions-Datei anderer Hersteller importiert werden, wird das Liniennetz nur zwischen Querprofilen mit der gleichen Anzahl an Elementen gezeichnet. Besitzen aufeinanderfolgende Querprofile eine ungleiche Anzahl an Elementen, ist die Verbindung zweideutig, daher wird zwischen diesen Querprofilen kein Liniennetz gezeichnet, und es findet keine Interpolation zwischen diesen Profilen beim Abstecken mit einem Vermessungsgerät statt.

HINWEIS: Enthält die Trassendefinition Regelquerschnitte, die mit dem Regelquerschnitt-Editor erstellt wurden, wird das Liniennetz unter Beachtung der Verbindungsregeln gezeichnet, die im Beispiel-Kurvenband definiert sind.


Trassenoberfläche anzeigen
Trasse / Trassenoberfläche anzeigen

 Siehe auch

Verwenden Sie diesen Befehl, um ein Höhenlinienmodell der Trasse anzuzeigen. Verwenden Sie das Höhenlinienmodell zur Bestätigung der Trassendefinition. Das Höhenlinienmodell kann zur Absteckung exportiert werden.

HINWEIS: Verwenden Sie die Option Ansicht / Layer , um eine Trassenoberfläche auszublenden. Die Layer-Bezeichnung entspricht der Trassenbezeichnung und hat die Erweiterung (TTM).


Berichte
Trasse / Berichte

 Siehe auch

Verwenden Sie diesen Befehl, um die folgenden Berichttypen zu erstellen:

  Trasse

  Absteckung

  Volumen

HINWEIS: Volumenberichte stehen nur zur Verfügung, wenn ein Höhenlinienmodell mit der Trasse verknüpft ist. Wenn Sie bei der Erstellung der Trasse keine Oberfläche gewählt haben, können Sie dies nun tun. Wählen Sie Trasse / Optionen, und wählen Sie die entsprechende Oberfläche aus der Oberflächen-Dropdown Liste.


Trassenbericht

 Siehe auch

Verwenden Sie diese Option, um einen Bericht der Kurvenbanddefinition zu erstellen, die die angewandten horizontalen und vertikalen Kurvenbänder, Regelquerschnitte und die angewandte Überhöhung enthält.

HINWEIS: Das Berichtsformat für das horizontale Kurvenband reflektiert die Eingabemethode (d. h. SP oder Elemente). Das folgende Beispiel veranschaulicht eine Kurvenbandeingabe unter Verwendung der Elemente-Methode.


Beispiel Trassenbericht

 Siehe auch

Das Berichtsformat für das horizontale Kurvenband reflektiert die Eingabemethode (SP oder Elemente). Das folgende Beispiel veranschaulicht eine Kurvenbandeingabe unter Verwendung der Elemente-Methode:

Trassenbericht

Projekt: Tutorial_2

Projektname	Tutorial_2
Trasse	Demo
Einheiten	Meter
Druckdatum	21/04/00 4:07pm
Horizontale Geometrie

Startpunkt

Element   Hochwert  Rechtswert   Azimut     Radius    Länge   D.Winkel    Station

Punkt     4000.000   2000.000                                             500.000

Linie     4000.000   2433.333   90°00'00"            433.333              933.333

Bogen     4100.000   2733.333              -500.000  321.751  36°52'12"  1255.084

Linie     4251.317   2935.089   53°07'48"            252.195             1507.278

Bogen     4325.658   3076.975               500.000  160.875  18°26'06"  1668.154

Linie     4500.000   3600.000   71°33'54"            551.317             2219.470

Vertikale Geometrie

Vertikaler Startpunkt

  Gefälle Hinein        0.000000%     Gefälle Hinaus         -4.500000%

      Koordinaten        Station        Höhe

      VSP-Punkt          500.000      46.000

  Horiz. Kurvendetails für Kurve Nr.   1

  Kurventyp     Senkung Symmetrische Parabel

  Länge                    500.000

  Gefälle hinein         -4.500000%          Gefälle Hinaus          -0.571429%

      Koordinaten        Station      Höhe

      VSP-Punkt          900.000      28.000

      Kurvenbeginn       650.000      39.250

      Kurvenende        1150.000      26.571

  Vertikale Kurvendetails für Kurve Nr.  2

  Kurventyp  Gipfel Symmetrische Parabel

  Länge                     500.000

  Gefälle Hinein          -0.571429%        Gefälle Hinaus           -1.129998%

      Koordinaten         Station       Höhe

      VSP-Punkt           1600.000     24.000

      Kurvenbeginn        1350.000     25.429

      Kurvenende          1850.000     21.175

Vertikaler Endpunkt

Gefälle Hinein           -1.129998         Gefälle Hinaus              0.000000%

      Koordinaten          Station       Höhe

      VSP-Punkt            2219.470     17.000

Regelquerschnitte

Station            Linke Regelquerschnitte    Rechte Regelquerschnitte

    500.000             Profil3                    Profil3

   2219.470             Profil3                    Profil3

Überhöhung

                            Überhöhung           Ausweitung

    Station     Links      Rechts      Links      Rechts    Drehpunkt

    863.333    -2.000%    -2.000%      0.000      0.000       Kuppe

    923.333    -2.000%     2.000%      0.000      0.000       Kuppe

    933.333    -2.667%     2.667%      0.000      0.000       Kuppe

    953.333    -4.000%     4.000%      0.000      0.000       Kuppe

   1235.084    -4.000%     4.000%      0.000      0.000       Kuppe

   1255.084    -2.667%     2.667%      0.000      0.000       Kuppe

   1265.084    -2.000%     0.000%      0.000      0.000       Kuppe

   1325.084    -2.000%    -2.000%      0.000      0.000       Kuppe

   1437.278    -2.000%    -2.000%      0.000      0.000       Kuppe

   1497.278     2.000%    -2.000%      0.000      0.000       Kuppe

   1507.278     2.667%    -2.667%      0.000      0.000       Kuppe

   1527.278     4.000%    -4.000%      0.000      0.000       Kuppe

   1648.154     4.000%    -4.000%      0.000      0.000       Kuppe

   1668.154     2.667%    -2.667%      0.000      0.000       Kuppe

   1678.154     2.000%    -2.000%      0.000      0.000       Kuppe

   1738.154    -2.000%    -2.000%      0.000      0.000       Kuppe


Absteckungsbericht

 Siehe auch

Verwenden Sie diese Option, um einen Absteckungsbericht der Kurvenbanddefinition zu erstellen.

HINWEIS: Wenn kein Höhenlinienmodell verfügbar ist, enthält der Bericht keine Geländeschnittpunkte.

Wenn Sie bei der Erstellung der Trasse kein Höhenlinienmodell gewählt haben, können Sie dies nun tun. Wählen Sie Trasse / Optionen, und wählen Sie die entsprechende Oberfläche aus der Oberflächen-Liste. Die Liste enthält alle Oberflächen im aktuellen Projekt und alle aus anderen Projekten importierten Oberflächen. Weitere Informationen zum Importieren von Oberflächen aus anderen Projekten finden Sie unter Datei / Importieren - Register Oberfläche  – Höhenlinienmodell.

Für genaue Volumenberechnungen muß die Querprofilbreite Urgelände mindestens genauso breit sein, wie die maximale Ausdehnung des Seitengefälles.

HINWEIS: Wenn ein Höhenlinienmodell mit der Trasse verknüpft sein soll, müssen Sie das Höhenlinienmodell zuerst im DTMLink-Dienstprogramm erstellen. Oberflächen, die aus Software anderer Hersteller in DTMLink importiert wurden, stehen in RoadLink nicht zur Verfügung.


Beispiel Absteckungsbericht

 Siehe auch

Es folgt ein Beispiel eines Absteckungsberichts.

Absteckungsbericht

Projekt: Tutorial_2

Projektname	Tutorial_2
Trasse	Demo
Einheiten	Meter
Druckdatum	21/04/00 4:08pm
Solloberfläche

       Offset      Höhe    Hochwert    Rechtswert   Code

Station =  500.000

     -19.271      47.655    4019.271    2000.000  Geländeschnitt

     -15.200      45.620    4015.200    2000.000

     -14.000      45.620    4014.000    2000.000

     -11.000      46.220    4011.000    2000.000  Bankett

      -8.000      46.340    4008.000    2000.000

      -8.000      45.840    4008.000    2000.000

       0.000      46.000    4000.000    2000.000

       8.000      45.840    3992.000    2000.000

       8.000      46.340    3992.000    2000.000

      11.000      46.220    3989.000    2000.000  Bankett

      14.000      45.620    3986.000    2000.000

      29.548      42.510    3970.452    2000.000  Geländeschnitt

Station =  520.000

     -21.681      47.961    4021.681    2020.000  Geländeschnitt

     -15.200      44.720    4015.200    2020.000

     -14.000      44.720    4014.000    2020.000

     -11.000      45.320    4011.000    2020.000  Bankett

      -8.000      45.440    4008.000    2020.000

      -8.000      44.940    4008.000    2020.000

       0.000      45.100    4000.000    2020.000

       8.000      44.940    3992.000    2020.000

       8.000      45.440    3992.000    2020.000

      11.000      45.320    3989.000    2020.000  Bankett

      14.000      44.720    3986.000    2020.000

      19.926      43.535    3980.074    2020.000  Geländeschnitt


Volumenbericht

 Siehe auch

Verwenden Sie diese Option, um einen Erdbaumassenbericht für Abtrag oder Auftrag zu erstellen. Diese Option steht nur zur Verfügung, wenn Sie ein Höhenlinienmodell mit der Trasse verknüpft haben.

Verwenden Sie die Felder Beginn Station und Ende Station, um die Ausdehnung der Trasse, die für den Volumenbericht verwendet werden soll, zu definieren.

Wenn Sie bei der Erstellung der Trasse keine Oberfläche gewählt haben, können Sie dies nun tun. Wählen Sie Trasse / Optionen, und wählen Sie die entsprechende Oberfläche aus der Oberflächen-Liste. Die Liste enthält alle Oberflächen im aktuellen Projekt und alle aus anderen Projekten importierten Oberflächen. Weitere Informationen zum Importieren von Oberflächen aus anderen Projekten finden Sie unter Datei / Importieren - Register Oberfläche  – Höhenlinienmodell.

Für genaue Volumenberechnungen muß die Querprofilbreite Urgelände mindestens genauso breit sein, wie die maximale Ausdehnung des Seitengefälles.

HINWEIS: Wenn ein Höhenlinienmodell mit der Trasse verknüpft sein soll, müssen Sie die Oberfläche zuerst im DTMLink-Dienstprogramm erstellen. Oberflächen, die aus Software anderer Hersteller in DTMLink importiert wurden, stehen in RoadLink nicht zur Verfügung.


Beispiel Volumenbericht

 Siehe auch

Es folgt ein Beispiel eines Volumenberichts.

HINWEIS: Alle Erdbaumassen werden unter Verwendung des Schwerpunktabstands zwischen effektiven Endflächen berechnet. Abhängig von den Höhenlinien und der Geometrie der Trasse kann eine Warnmeldung über Fehler am Schwerpunkt erscheinen.

 Siehe auch

Volumenbericht

Projekt: Tutorial_2

Projektname	Tutorial_2
Trasse	Demo
Einheiten	Meter
Druckdatum	21/04/00 4:09 pm
Station:    500.000 bis:   2836.784

Trasse : Demo

          ------ Querprofilfläche ----  ----- Volumen ------  ---- Aufgehäuft ----

   Statn       Abtrag     Auftrag        Abtrag      Auftrag    Abtrag    Auftrag

   Meter  Quadratmeter Quadratmeter  Kubikmeter  Kubikmeter  Kubikmeter Kubikmeter

   500.000       14.98       32.19        0.00        0.00        0.00        0.00

   520.000       29.51        8.14      444.86      403.24      444.86      403.24

   540.000       45.45        1.98      749.57      101.19     1194.43      504.43

   560.000       54.54        0.00      999.88       19.83     2194.31      524.26

   580.000       63.14        0.00     1176.79        0.00     3371.10      524.26

   600.000       65.63        0.00     1287.70        0.00     4658.81      524.26

   620.000       58.16        0.00     1237.89        0.00     5896.69      524.26

   640.000       40.84        0.00      990.01        0.00     6886.70      524.26

   660.000       41.79        0.00      826.34        0.00     7713.04      524.26

   680.000       40.12        0.00      819.11        0.00     8532.15      524.26

   700.000       25.84        0.00      659.57        0.03     9191.72      524.28

   720.000        2.02       14.41      278.57      144.12     9470.29      668.40

   740.000       11.28       10.78      133.00      251.85     9603.29      920.25

   760.000       14.01        3.52      252.91      142.94     9856.20     1063.20

   780.000        3.97        2.32      179.80       58.42    10036.00     1121.61

   800.000        0.53       19.66       45.02      219.82    10081.02     1341.43


Optionen
Trasse / Optionen

 Siehe auch

Verwenden Sie diesen Befehl, um die Voreinstellungen der Trasse zu bearbeiten.


Menü "Trasse"
Menü “Trasse”

Verwenden Sie die Befehle im Menü “Trasse”, um einen Entwurf für die Übertragung zur Absteckung anzuwenden und zu bearbeiten.

Das Menü bietet die folgenden Befehle:

Horizontal

Vertikal

Regelquerschnitte

Überhöhung

Profile

Liniennetz für Trasse anzeigen

Trassenoberfläche anzeigen

Berichte

Optionen


Regelquerschnitt / Neu

Verwenden Sie diesen Befehl für die Erstellung eines neuen Regelquerschnitts, der das Sollquerprofil für die Solltrasse repräsentiert. Es muß nur ein Regelquerschnitt für eine Seite des Kurvenbands erstellt werden. Verwenden Sie die Option Ansicht wechseln, um eine bessere Ansicht eines Regelquerschnitts zu erhalten, der für die linke Trassenseite verwendet werden soll.

Ein Regelquerschnitt wird, wenn er erstellt ist, in einer Projekt-Regelquerschnittsbibliotheksdatei gespeichert. Sie können den Regelquerschnitt für andere Trassen und Projekte einsetzen.


Regelquerschnittserstellung

Mit dem Befehl Regelquerschnitt / Neu können Sie einen neuen Regelquerschnitt erstellen.

Regelquerschnittsbezeichnung

Wählen Sie Regelquerschnitt / Neu, und geben Sie die Bezeichnung des Regelquerschnitts in dieses Feld ein. Die Bezeichnung kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen und muß in dieser Bibliothek einmalig sein.

Klicken Sie auf OK, und die Funktion Regelquerschnitt bearbeiten wird gestartet.

Das Graphikfenster zeigt die Koordinatenachse an, die den Schnittpunkt der horizontalen und vertikalen Kurvenbänder darstellt.

Das Fenster im Dialogfeld Regelquerschnitt bearbeiten zeigt die Bezeichnungen und Beziehungen der Regelquerschnitte untereinander in der aktuellen Bibliothek an. In diesem Fenster werden diese Beziehungen als Baumansicht dargestellt. Die Baumansicht kann an den Knoten ein- oder ausgeblendet werden. Klicken Sie auf das Pluszeichen (+), um die Ansicht einzublenden oder auf das Minuszeichen (-), um die Ansicht auszublenden, siehe Abb. 1.

Abb. 1  Fenster im Dialogfeld Regelquerschnitt bearbeiten

Die ausgeblendete Baumansicht zeigt lediglich die Regelquerschnittsbezeichnungen an. Wenn sie expandiert wird, erscheinen die Solloberfläche und ihre Elementnamen (jeder Regelquerschnitt besteht aus einer einzigen Solloberfläche, die anfänglich als Subgrade bezeichnet wird. Sie können die Bezeichnung im Namensfeld Subgrade ändern).

Jede Solloberfläche beginnt mit einem Regelquerschnittselement namens Subgrade01. Dieses Element definiert den Startpunkt der Solloberfläche. Die Höhen- und Offsetwerte in den Feldern Höhenunterschied und Offset sind auf den Ursprung der Koordinatenachsen (0,0) festgelegt. Der Ursprung stellt den Schnittpunkt der horizontalen und vertikalen Kurvenbänder dar, denen der Regelquerschnitt zugeordnet wurde.

Anwenden

Wählen Sie Anwenden, um die Felder, die das Element definieren, zu akzeptieren.

Neu

Wählen Sie Neu, um ein neues Element zum aktuellen Element hinzuzufügen. Die Elementbezeichnung wird automatisch eingetragen, wenn Elemente hinzugefügt werden. Der Bezeichnung ist einmalig und entspricht der voreingestellten Solloberflächenbezeichnung mit einem zweistelligen Suffix. Sie können diese Bezeichnung, falls erforderlich, ändern.

Löschen

Wählen Sie Löschen, um das aktuelle Element zu löschen.

Elementtyp

Die Solloberfläche kann durch die folgenden Regelquerschnittselemente definiert werden:

  Soll-Linien-Elemente

  Seitengefälle-Elemente (Abtrag und Auftrag)

TIP: Verwenden Sie die Schaltfläche Eigenschaften auf der Symbolleiste oder das Verknüpfungsmenü, um das Eigenschaftsfenster im Graphikfenster zu öffnen. Im Eigenschaftsfenster werden die Eigenschaften und Werte der ausgewählten Elemente angezeigt.

HINWEIS: Verwenden Sie die Option Ansicht wechseln, um bei der Erstellung eine bessere Ansicht der Regelquerschnitte zu erhalten. Festgelegte Offsets sind immer positive Werte, unabhängig von der Regelquerschnittsansicht.


Soll-Linie
Elementtyp / Soll-Linie

Soll-Linienelemente beginnen immer am aktuellen Auswertungspunkt (d.h. dem Ende des vorhergehenden Elements).

Methode

Wählen Sie Soll-Linie im Feld Elementtyp, und das Feld Methode erscheint. Wählen Sie die Definitionsmethode für Soll-Linienelemente. Die verfügbaren Methoden sind:

  Querneigung und Offset

 Höhenunterschied und Offset


Querneigung und Offset

Wenn Sie diesen Befehl wählen, ändern sich die Optionen im Dialogfeld Regelquerschnitt bearbeiten.

Überhöhung anwenden

Wählen Sie das Kontrollkästchen Überhöhung anwenden, und die Soll-Linie wird im Bezug auf einen beliebigen unter Trasse / Überhöhung festgelegten Überhöhungswert ausgeglichen.

Ausweitung anwenden

Das Kontrollkästchen Ausweitung anwenden ist nur verfügbar, wenn das Kontrollkästchen Überhöhung anwenden gewählt ist. Wählen Sie das Kontrollkästchen Ausweitung anwenden, und ein beliebiger unter Trasse / Überhöhung festgelegter Ausweitungswert wird auf dieses Linienelement angewandt.

Querneigung

Das Feld Querneigung bestimmt das Gefälle des Elements.

Offset

Das Feld Offset bestimmt die Länge des Elements und muß einen positiven Wert enthalten.

Code

Ein Code kann festgelegt werden. Der Code wird dem Ende der Soll-Linie zugeordnet und wird durch ein diagonales Kreuz angezeigt. Der Codename kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen.

HINWEIS: Das Feld Querneigung kann ausgefüllt oder als prozentuale Querneigung oder Verhältnis angezeigt werden. Verhältnisse werden mit einem Doppelpunkt eingegeben, der den Zähler von dem Nenner trennt (z. B.  1:3,333). Bei Zahlen, die ohne Doppelpunkt und mit oder ohne Prozentzeichen eingegeben werden, wird angenommen, daß es sich um Prozentsätze (z. B.  30 oder 30%) handelt. Horizontale Gefälle werden als 0% eingegeben und angezeigt.

Wenn ein Regelquerschnitt gespeichert wird, werden die Anzeige und der Bericht über die Querneigungs- und die Seitengefällewerte von den Feldern Gefälleformat und Seitengefälleformat unter Datei / Projekteigenschaften im Register Einheiten und Format in der Trimble Geomatics Office™-Software gesteuert.

HINWEIS: Der Querneigungswert der ersten Soll-Linie, mit gewähltem Überhöhungsfeld und positivem Offset, wird für die Überhöhungsberechnung verwendet, wenn die Drehpunktposition auf Links oder Rechts eingestellt ist. Dieser Querneigungswert wird zudem beim Vergleich zwischen den Start- und End- Überhöhungswerten in einer Überhöhungstabelle verwendet. Alle Nichtübereinstimmungen werden gemeldet, bevor die Trasse exportiert wird.


Höhenunterschied und Offset

Im Feld Höhenunterschied können Sie den Höhenunterschied vom Beginn zum Ende der Linie festlegen.

Im Feld Offset können Sie den Offset-Unterschied vom Beginn zum Ende der Linie festlegen.

Überhöhung anwenden

Wählen Sie das Kontrollkästchen Überhöhung anwenden, um die Soll-Linie im Bezug auf einen beliebigen (unter Trasse / Überhöhung festgelegten) Überhöhungswert auszugleichen.

Ausweitung anwenden

Das Kontrollkästchen Ausweitung anwenden ist nur verfügbar, wenn das Kontrollkästchen Überhöhung anwenden gewählt ist. Wählen Sie das Kontrollkästchen Ausweitung anwenden, um einen beliebigen (unter Trasse / Überhöhung festgelegten) Ausweitungswert auf dieses Linienelement anzuwenden.

Code

Ein Code kann festgelegt werden. Der Code wird dem Ende der Soll-Linie zugeordnet und wird durch ein diagonales Kreuz angezeigt. Der Codename kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen.


Überhöhung und Ausweitung anwenden

Dieser Abschnitt erläutert, wie die Überhöhung, die Ausweitung oder beide auf die Elemente innerhalb eines Regelquerschnitts angewendet werden.

Die Überhöhung, die auf jedes zu überhöhende Element angewendet wird, wird vom ersten Soll-Linienelement bestimmt, wobei die Option Überhöhung anwenden auf Ja eingestellt ist. Der Überhöhungsbetrag wird von der Beziehung der Querneigung dieser ersten Linie zu der überhöhten Querneigung (wie unter Trasse / Überhöhung festgelegt) bestimmt.

Wenn z. B. das erste Element, auf das die Überhöhung in einem Regelquerschnitt angewendet werden kann, eine Querneigung von -2% aufweist, und die Überhöhung bei der Station +6% sein soll, dann wird 8% zu den Querneigungen aller Elemente hinzugefügt, die in dem Regelquerschnitt überhöht sind.

Abb. 1 enthält eine Querprofilansicht der Überhöhungsanwendung.

Abb. 1  Die Überhöhung anwenden

Der unter Trasse / Überhöhung festgelegte Ausweitungsbetrag wird auf jedes Regelquerschnittselement angewendet, für das die Option Ausweitung anwenden gewählt ist.

Die Überhöhung und die Ausweitung treten in Erscheinung, wenn die Überhöhung auf die Trasse angewendet wird. Wählen Sie Trasse / Profile, um das Ergebnis anzusehen


Seitengefälle
Elementtyp / Seitengefälle

Seitengefälleelemente legen das Abtrags- oder Auftragsgefälle und die Grabenbreite am Ende einer Solloberfläche fest. Seitengefällewerte können nicht vertikal sein.

Abtragsgefälle

Geben Sie den Wert für das Abtragsseitengefälle in dieses Feld ein.

Auftragsgefälle

Geben Sie den Wert für das Auftragsseitengefälle in dieses Feld ein.

Grabenbreite

Geben Sie den Wert für die Grabenbreite in dieses Feld ein. Dieses Feld ermöglicht die Einfügung eines Flachbodengrabens vor einem Abtragsgefälle.

HINWEISE:

1.	Seitengefälle stellen das letzte Element in einem Regelquerschnitt dar.

2.	Ein Code kann ebenfalls festgelegt werden. Der Code wird dem Ende des Abtrags- oder Auftragsseitengefälles zugeordnet.

3.	Der Startpunkt für die Auswertung jedes Solloberflächenelements ist der Endpunkt des vorhergehenden Elements. Es darf innerhalb einer Regelquerschnittssolloberfläche keine Lücken geben.


Löschen
Regelquerschnitt / Löschen

Verwenden Sie diesen Befehl, um den hervorgehobenen Regelquerschnitt im Dialogfeld Regelquerschnitt bearbeiten zu löschen.

TIP: Klicken Sie auf Löschen, oder drücken Sie die Taste Entf, um Elemente zu löschen.

HINWEIS: Wenn Sie einen Regelquerschnitt löschen, der einer Trasse zugeordnet war, müssen Sie Regelquerschnitte mit der Option Trasse / Regelquerschnitte neu zuordnen.


Importieren
Regelquerschnitt / Importieren

Verwenden Sie diesen Befehl, um einen Regelquerschnitt in die aktuelle Bibliothek zu importieren.

Klicken Sie auf Öffnen, und RoadLink importiert den Regelquerschnitt. Wenn der Regelquerschnitt bereits existiert, fordert Sie die Software auf, eine neue Regelquerschnittsbezeichnung einzugeben. Die Bezeichnung kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen.

Wenn ein Regelquerschnitt importiert wird, wird eine Sicherungskopie der ursprünglichen Regelquerschnittsbibliothek erzeugt. Diese Datei wird TEMPLAnnnn.BAK genannt (wobei nnnn eine Zahl ist) und kann zu TEMPLA0001.DAT umbenannt werden, um die Regelquerschnittsbibliothek in ihrem ursprünglichen Zustand vor dem Importieren von Regelquerschnitten wiederherzustellen.


Exportieren
Regelquerschnitt / Exportieren

Verwenden Sie diesen Befehl, um einen individuellen Regelquerschnitt zu exportieren. Sie können den exportierten Regelquerschnitt unter Verwendung der Option Regelquerschnitt importieren zu einer bestehenden Regelquerschnittsbibliothek in einem anderen Projekt hinzufügen.

HINWEIS: Sie müssen den Namen des zu exportierenden Regelquerschnitts hervorheben, bevor Sie diese Option wählen können.


Berichte
Regelquerschnitt / Berichte

Verwenden Sie diesen Befehl, um einen Bericht über den aktuell gewählten Regelquerschnitt zu erstellen und anzusehen.


Kopieren
Regelquerschnitt / Kopieren

Verwenden Sie diesen Befehl, um einen Regelquerschnitt aus einer Bibliothek in die aktuelle Bibliothek oder in eine andere Bibliothek zu kopieren. Das Dialogfeld Regelquerschnitt kopieren erscheint.

HINWEIS: Sie müssen den Namen des zu kopierenden Regelquerschnitts hervorheben, bevor Sie diese Option wählen können.


Dialogfeld Regelquerschnitt kopieren

Verwenden Sie dieses Dialogfeld, um einen Regelquerschnitt aus einer Bibliothek in die aktuelle Bibliothek oder in eine andere Bibliothek zu kopieren.

Von Bibliothek

Wählen Sie die Bibliothek, aus der Sie einen Regelquerschnitt kopieren möchten. Geben Sie eine Bezeichnung in das Feld Von Bibliothek ein, oder wählen Sie sie aus der Liste. Eine Liste der verfügbaren Regelquerschnitte in der gewählten Bibliothek erscheint in dem Fenster. Heben Sie die Bezeichnung des Regelquerschnitts hervor.

Zu Bibliothek

Wählen Sie die Bibliothek, in die Sie einen Regelquerschnitt kopieren möchten. Geben Sie eine Bezeichnung in das Feld Zu Bibliothek ein, oder wählen Sie sie aus der Liste. Die Bezeichnung des zu kopierenden Regelquerschnitts erscheint im Feld Neue Regelquerschnittsbezeichnung. Verwenden Sie dieses Feld, um die Bezeichnung zu bearbeiten. RoadLink warnt Sie, wenn die neue Regelquerschnittsbezeichnung bereits existiert.


Umbenennen
Regelquerschnitt / Umbenennen

Verwenden Sie diesen Befehl, um einen Regelquerschnitt umzubenennen.

Regelquerschnittsbezeichnung

Heben Sie die Regelquerschnittsbezeichnung hervor, die Sie umbenennen möchten, und wählen Sie den Befehl “Regelquerschnitt umbenennen”. Das Dialogfeld Regelquerschnitt umbenennen erscheint. Geben Sie die neue Bezeichnung in das Feld Regelquerschnittsbezeichnung ein. Die Bezeichnung kann aus einer beliebigen Kombination von bis zu sechzehn (16) alphanumerischen Zeichen bestehen.

RoadLink warnt Sie, wenn ein Regelquerschnitt mit dieser Bezeichnung bereits existiert.

HINWEIS: Wenn Sie einen Regelquerschnitt umbenennen, der einer Trasse zugeordnet war, müssen Sie die Regelquerschnitte mit der Option Trasse / Regelquerschnitte neu zuordnen.


Menü "Regelquerschnitt"
Menü “Regelquerschnitt”

Verwenden Sie das Menü “Regelquerschnitt”, um Regelquerschnitte zu erstellen. Ein Regelquerschnitt ist ein typisches Trassenquerprofil. Die Regelquerschnitte können in einer Bibliothek gespeichert werden, um für alle Trassen verfügbar zu sein.

Es verfügt über die folgenden Befehle:

Neu

Löschen

Importieren

Exportieren

Berichte

Kopieren

Umbenennen


Regelquerschnitt-Editor
Extras / Regelquerschnitt-Editor

Verwenden Sie den Befehl Extras / Regelquerschnitt-Editor, um das Dialogfeld Regelquerschnitt bearbeiten zu öffnen und den ersten Regelquerschnitt in der aktuellen Bibliothek anzuzeigen.

Der Regelquerschnitt wird als Graphik gleichzeitig im Graphikfenster angezeigt und automatisch aktualisiert, während Sie im Dialogfeld Regelquerschnitt bearbeiten die Bearbeitungen vornehmen.

Die kompletten Regelquerschnitte werden in einer Regelquerschnittsbibliothek im Projektordner gespeichert. Die Regelquerschnittsbibliothek ist eine Datei mit der Bezeichnung TEMPLANnn.DAT (wobei nn eine Zahl ist). Es gibt keine feste Grenze für die Anzahl der Regelquerschnitte, die in jeder Regelquerschnittsbibliothek gespeichert werden können.


Menü "Extras"
Menü “Extras”

Verwenden Sie das Menü “Extras”, um Regelquerschnitte zu erstellen und zu bearbeiten.

Das Menü verfügt über folgenden Befehl:

Regelquerschnitt-Editor


Vergrößern
Ansicht / Vergrößern

	Klicken Sie auf das Symbol Vergrößern auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um einen Teil des Graphikfensters genauer einzusehen.

1.	Wählen Sie das Symbol Vergrößern.

2.	Bewegen Sie den Zeiger über das Graphikfenster. Der ein Pluszeichen einschließende Vergrößerungsglaszeiger erscheint. Fadenkreuze oberhalb des Vergrößerungsglaszeigers markieren die gewünschte Stelle.

3.	Führen Sie einen der folgenden Vorgänge durch:

  Klicken Sie auf eine Position in dem Graphikfenster, um eine zweifache Vergrößerung mit der gewünschten Stelle im Mittelpunkt zu erhalten.

  Klicken und ziehen Sie den Zeiger über das Graphikfenster, um dadurch ein Rechteck zu erzeugen, das die Fläche beinhaltet, die Sie vergrößern möchten. Je kleiner die Fläche ist, desto größer ist die Maßstabsänderung. Der in dem Rechteck enthaltene Flächeninhalt nimmt das gesamte Graphikfenster ein, wenn die Maustaste losgelassen wird. Um die Vergrößerung abzubrechen, kehren Sie zu dem Punkt zurück, von dem Sie den Zeiger anfänglich gezogen haben, bevor Sie die Maustaste freigeben.

HINWEISE:

Drücken Sie Esc, während die linke Maustaste gedrückt ist, um die aktuelle Operation des Vergrößerungssymbols abzubrechen.

Wenn Sie die Taste Umschalt gedrückt halten, während der Zoom-Vorgang durchgeführt wird, wird ein Zusatzfenster des Zoom-Bereichs geöffnet.


Verkleinern
Ansicht / Verkleinern

	Klicken Sie auf das Symbol Verkleinern auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um eine größere Fläche innerhalb eines Graphikfensters anzusehen.

1.	Wählen Sie das Symbol Verkleinern.

2.	Bewegen Sie den Zeiger über das Graphikfenster. Der ein Minuszeichen einschließende Vergrößerungsglaszeiger erscheint. Fadenkreuze oberhalb des Vergrößerungsglaszeigers markieren die gewünschte Stelle.

3.	Führen Sie einen der folgenden Vorgänge durch:

  Klicken Sie auf eine Position in dem Graphikfenster, um eine zweifache Verkleinerung mit der gewünschten Stelle im Mittelpunkt zu erhalten.

  Klicken und ziehen Sie den Zeiger über das Graphikfenster, um dadurch ein Rechteck zu erzeugen, das die Fläche beinhaltet, die Sie verkleinern möchten, und geben Sie dann die Maustaste frei. Der Maßstab des Graphikfensters ändert sich, und die zuvor in dem Rechteck enthaltene Fläche wird angezeigt. Um die Verkleinerung abzubrechen, kehren Sie zu dem Punkt zurück, von dem Sie den Zeiger anfänglich gezogen haben, bevor Sie die Maustaste freigeben.

HINWEISE:

Drücken Sie Esc, während die linke Maustaste gedrückt ist, um die aktuelle Operation des Verkleinerungssymbols abzubrechen.

Klicken und ziehen Sie ein Rechteck auf dem Graphikfenster. Wenn der Verkleinerungsvorgang durchgeführt wird, enthält das Rechteck die vorherige Ansicht. Je kleiner das Rechteck ist, desto größer ist die Maßstabsänderung.


Verschieben
Ansicht / Verschieben

	Klicken Sie auf das Symbol Verschieben auf der Ansicht-Symbolleiste

Verwenden Sie dieses Symbol, um den Inhalt des Graphikfensters zu verschieben, damit eine andere Fläche der Bildschirmanzeige dargestellt werden kann. Das Symbol Verschieben verschiebt die ursprüngliche Ansicht.

1.	Wählen Sie das Symbol Verschieben.

2.	Bewegen Sie den Zeiger über das Graphikfenster. Der Handzeiger erscheint. Fadenkreuze oberhalb des Handzeigers markieren die gewünschte Stelle.

3.	Führen Sie einen der folgenden Vorgänge durch:

  Klicken Sie auf eine Position in dem Graphikfenster. Diese Position wird zum neuen Mittelpunkt des Fensters.

  Klicken und ziehen Sie den Handzeiger in die Richtung, in die Sie verschieben möchten, und über die Streckenlänge, über die Sie verschieben möchten. Eine Linie erscheint, um die Richtung und Streckenlänge der Bildschirmverschiebung anzuzeigen. Geben Sie die Schaltfläche frei. Die Bildschirmansicht wird zu dieser neuen Position verschoben. Um die Verschiebung abzubrechen, kehren Sie mit dem Handzeiger zu dem Punkt zurück, von dem Sie diesen Zeiger anfänglich gezogen haben, bevor Sie die Maustaste freigeben.

HINWEIS: Um die aktuelle Operation des Symbols Verschieben abzubrechen, drücken Sie Esc, während Sie die linke Maustaste gedrückt halten.


Verschieben zu

Verwenden Sie dieses Dialogfeld, um zu einer bestimmten Stelle auf dem Graphikfenster zu verschieben und zu skalieren.

Planansicht

Punktname:

Verwenden Sie dieses Feld, um eine Bezeichnung für die Ansichtsmitte festzulegen.

Rechtswert/Hochwert

Verwenden Sie diese Felder, um die Ansichtsmitte zu ermitteln.

Ansichtsradius

Legt die Ausdehnung der Ansicht fest.

Die Bildschirmmitte wird um die Streckenlänge des angegebenen Radius verschoben. Die Strecke hängt von der Orientierung des Graphikfensters ab. Die folgende Abbildung verdeutlicht dies:

Profilansicht

Station/Höhe

Verwenden Sie diese Felder, um die Ansichtsmitte zu ermitteln.

Breite/Höhe von Ansicht

Verwenden Sie diese Felder, um die Größe der Ansicht zu definieren.

Überhöhungsansicht

Station/Überhöhung

Verwenden Sie diese Felder, um die Ansichtsmitte zu ermitteln.

Breite/Höhe von Ansicht

Verwenden Sie diese Felder, um die Größe der Ansicht zu definieren.

Querprofilansicht und Regelquerschnittsansicht

Offset/Höhe

Verwenden Sie diese Felder, um die Ansichtsmitte zu ermitteln.

Breite/Höhe von Ansicht

Verwenden Sie diese Felder, um die Größe der Ansicht zu definieren.

TIP: Klicken Sie auf das Graphikfenster, um im Bildschirm die graphische Auswahl zu verwenden.


Zoom-Ausdehnung
Ansicht / Zoom-Ausdehnung

	Klicken Sie auf das Symbol Zoom-Ausdehnung auf der Ansicht-Symbolleiste

Verwenden Sie diesen Befehl, um alle sichtbaren Punkte in dem aktuellen Projekt anzusehen.

Wenn Sie den Befehl Zoom-Ausdehnung wählen, paßt sich das Graphikfenster automatisch an, so daß alle Daten sichtbar sind.


Vorherige Ansicht
Ansicht / Vorherige Ansicht

	Klicken Sie auf das Symbol Vorherige Ansicht auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um zur vorherigen Ansicht zu gelangen.

Verwenden Sie diesen Befehl, um alle vorherigen Ansichten durchzugehen, seit Sie das Projekt eingegeben haben.


Zoom-Ansichten
Ansicht / Zoom-Ansichten

	Klicken Sie auf das Symbol Zoom-Ansichten auf der Ansicht-Symbolleiste
Verwenden Sie dieses Symbol, um die aktuelle Bildschirmansicht zu speichern, eine zuvor gespeicherte Ansicht aufzurufen oder eine zuvor gespeicherte Ansicht beizubehalten.

Verwenden Sie diesen Befehl, um die aktuelle Ansicht einer Liste mit gespeicherten Ansichten hinzuzufügen. Die aktuelle Liste mit gespeicherten Ansichten (maximal zehn) erscheint in der Reihenfolge, in der Sie sie gespeichert haben.

Informationen zum Bearbeiten der Liste finden Sie unter Bearbeiten.

Treffen Sie eine Auswahl aus der Liste, um eine beliebige gespeicherte Ansicht wiederherzustellen und anzuzeigen.

Speichern

Geben Sie den Namen für die Ansicht in das Feld Name ein.

Bearbeiten

Wählen Sie den Namen der Ansicht, die Sie bearbeiten möchten, aus der im Dialogfeld Ansicht angezeigten Liste.

Klicken Sie auf Umbenennen, und geben Sie die Einzelheiten in das Dialogfeld Ansicht umbenennen ein.


Zusatzfenster
Ansicht / Zusatzfenster

	Verwenden Sie das Symbol Zusatzfenster auf der Ansicht-Symbolleiste

Verwenden Sie diesen Befehl, um das Zusatzfenster anzuzeigen. Wenn das Zusatzfenster geöffnet ist, verbleibt es immer im Vordergrund.

Das Zusatzfenster bietet eine andere Ansicht. Wie bei anderen Graphikfenstern können Sie die graphische Auswahl und Zoom-Funktionen innerhalb des Zusatzfensters verwenden.

Dies bedeutet, daß Sie das Zusatzfenster z. B. als ein Hilfsmittel einsetzen können, um eine Vogelperspektive oder eine vergrößerte Ansicht unabhängig von dem Graphikfenster zu erhalten. Beide Fenster können für gebräuchliche Operationen (wie graphische Auswahl und Zoom-Funktionen) eingesetzt werden.

HINWEIS: Der Befehl Ansicht / Zoom-Ausdehnung kann in dem Graphikfenster verwendet werden. Wenn Sie eine Zoom-Ausdehnung in dem Zusatzfenster durchführen möchten, klicken Sie auf Verknüpfungsmenü.

Um eine vergrößerte Ansicht in dem Zusatzfenster zu erhalten, spezifizieren Sie die zu vergrößernde Fläche im Graphikfenster, indem Sie die Taste Umschalt gedrückt halten und mit dem Vergrößerungssymbol ziehen.

Um eine vergrößerte Ansicht in dem Graphikfenster zu erhalten, spezifizieren Sie die zu vergrößernde Fläche im Zusatzfenster, indem Sie die Taste Umschalt gedrückt halten und mit dem Verkleinerungssymbol ziehen. Dies demonstriert, wie das Zusatzfenster als Vogelperspektive eingesetzt werden kann.

HINWEIS: Die Titelleiste des Zusatzfensters wird als aktiviert angezeigt, wenn das assoziierte Graphikfenster aktiviert ist.


Oberfläche
Ansicht / Oberfläche

Verwenden Sie diesen Befehl, um ein bestehendes Höhenlinienmodell graphisch anzuzeigen.

HINWEIS: Diese Option steuert nur die Anzeige der (in DTMLink erstellten) verfügbaren Oberflächen. Wählen Sie Trasse / Trassenoberfläche anzeigen, um ein Höhenlinienmodell der Trassenoberfläche anzuzeigen.

Oberfläche

Treffen Sie eine Auswahl aus der Liste verfügbarer Oberflächen. Diese Liste enthält alle Oberflächen im aktuellen Projekt sowie alle aus anderen Projekten importierten Oberflächen. Weitere Informationen finden Sie unter Option Höhenlinienmodell.

HINWEIS: Sie müssen zuerst ein Höhenlinienmodell in DTMLink erstellen, bevor dieses angezeigt werden kann. Oberflächen, die aus Software anderer Hersteller in DTMLink importiert wurden, stehen in RoadLink nicht zur Verfügung.

Kleine und Große Intervalle

Bearbeiten Sie die kleinen und großen Intervalle, die Sie benötigen.

Dreiecke anzeigen

Wählen Sie das Kontrollkästchen Dreiecke anzeigen, um Dreiecke anzuzeigen.


Gitterlinien
Ansicht / Gitterlinien

Verwenden Sie diesen Befehl, um Gitterlinien für die Horizontale Ansicht, Vertikale Ansicht, Überhöhungsansicht und die Querprofilansicht anzeigen zu lassen.

Gitterlinien anzeigen

Wählen Sie dieses Kontrollkästchen, um Gitterlinien für die ausgewählte Ansicht anzeigen zu lassen.

Sie können für jede Ansicht:

 eine festgelegte Anzahl von Gitterlinien anzeigen lassen.

 Gitterlinien in einem bestimmten Intervall anzeigen lassen. Geben Sie dazu in der Horizontalansicht einen Gitterintervallwert ein. Geben Sie für alle anderen Ansichten horizontale und vertikale Gitterintervallwerte ein.

Gitterlinientyp

Wählen Sie den Gitterlinientyp aus der Liste.

Gitterlinienfarbe

Wählen Sie die Gitterlinienfarbe aus der Liste.

Gitterlinien beschriften

Wählen Sie das Kontrollkästchen, um die Gitterlinien zu beschriften.

Anwenden

Klicken Sie auf Anwenden, um die Gitterlinien auf die Ansicht anzuwenden.

HINWEISE:

 Die Optionen Gitterlinientyp, Gitterlinienfarbe und Gitterlinien beschriften können auf alle Ansichten angewandt werden.

 Die Gitterlinien-Einstellungen für die Querprofilansicht sind auch auf die Regelquerschnittsansicht anwendbar.


Layer
Ansicht / Layer

	Klicken Sie auf das Symbol Layer auf der Ansicht-Symbolleiste

Verwenden Sie diesen Befehl, um die Layer in der aktuellen Ansicht ein- oder auszublenden.

Wenn Sie einen bestimmten Layer ein- oder ausblenden, zeigt RoadLink die Elemente darin an oder blendet sie aus.

Sichtbarkeit von Layern

Die Liste Layer zeigt die Namen aller Layer im Projekt an. Eine Kontrollmarkierung weist darauf hin, daß der Layer sichtbar ist. Wählen Sie die Kontrollmarkierung für einen bestimmten Layer, um die Layer-Sichtbarkeit ein- oder auszuschalten.

TIP: Wenn Sie eine Trasse schließen, wird diese in einem Layer gespeichert. Die Layerbezeichnung ist die Trassenbezeichnung. Wenn das Projekt aus verschiedenen Trassen besteht, kann die aktuelle Trasse in Verbindung mit den zuvor geöffneten Trassen angesehen werden.

Alle

Klicken Sie auf Alle, um alle Layer in der Liste anzuzeigen.

Keine

Klicken Sie auf Keine, um alle Layer in der Liste auszublenden.

TIP: Wenn alle Layer ausgeblendet sind, werden keine Elemente auf dem Bildschirm angezeigt.

Anwenden

Klicken Sie auf Anwenden, um die Bearbeitungsresultate anzusehen.


Abbildung
Ansicht / Abbildung

Setzen Sie diesen Befehl ein, um die Ansicht einer importierten Abbildung ein- oder auszublenden, wenn Sie den Befehl Datei / Importieren verwenden.

Um eine importierte Abbildung anzuzeigen, schalten Sie den Befehl Ansicht / Abbildung auf ein. Die Abbildung wird angezeigt, wenn Sie den Befehl Datei / Importieren verwenden.

HINWEIS: Der Befehl Ansicht / Abbildung ist auf  ein geschaltet, wenn eine Kontrollmarkierung neben ihm erscheint.


Symbolleisten
Ansicht / Symbolleisten

Verwenden Sie diesen Befehl, um eine beliebige Symbolleiste ein- oder auszublenden.

Jede der Symbolleisten besteht aus einer Reihe von Symbolen, die durch Schaltflächen dargestellt werden. Jedes Symbol steht als Menübefehl zur Verfügung.

Symbolleisten

Um eine bestimmte Symbolleiste anzuzeigen, klicken Sie auf ihre Bezeichnung im Menü. Neben der Bezeichnung erscheint eine Kontrollmarkierung, wenn die entsprechende Symbolleiste angezeigt wird.

Es handelt sich um eine Ein- und Ausschalttaste. Um die Symbolleiste auszublenden, klicken Sie erneut auf die Bezeichnung. Die Kontrollmarkierung verschwindet, und die Symbolleiste wird ausgeblendet.

Schließen

Klicken Sie auf Schließen, um das Dialogfeld zu verlassen.

Alle

Klicken Sie auf Alle, um alle Symbolleisten anzuzeigen.

Keine

Klicken Sie auf Keine, um alle Symbolleisten auszublenden.

Zurücksetzen

Klicken Sie auf Zurücksetzen, um die Symbolleisten voreinstellungsgemäß wiederherzustellen.


Aktualisieren
Ansicht / Aktualisieren

Verwenden Sie diesen Befehl, um den Bildschirm zu aktualisieren.

Wählen Sie diesen Befehl (oder drücken Sie F5), um die Graphikansicht neu zu zeichnen, wenn das Graphikfenster mehrfach überschrieben wurde und dadurch schwierig zu lesen ist.


Eigenschaften
Ansicht / Eigenschaften

	Eigenschaftsfenster

Verwenden Sie das Eigenschaftsfenster, um die Eigenschaften eines ausgewählten Elements anzusehen. Dieses Fenster zeigt die Bezeichnungen und Werte des gewählten Elements an.

Wenn Sie sich ein Element in einem horizontalen Kurvenband ansehen (unter Verwendung des Eigenschaftsfensters), sind die Anfangs- und Endstation (Beginn Station und Ende Station) des Elements vorgegeben. Wenn Sie jedoch gerade das horizontale Kurvenband bearbeiten, kann es sein, daß die angezeigten Stationen nicht mit den zuletzt vorgenommenen Änderungen aktualisiert werden.


Menü "Ansicht"
Menü “Ansicht”

Das Menü “Ansicht” bietet Befehle für die Steuerung und Erhaltung der Anzeige von individuellen Graphikfenstern. Die folgenden Befehle sind verfügbar:

Vergrößern

Verkleinern

Verschieben

Verschieben zu

Zoom-Ausdehnung

Vorherige Ansicht

Zoom-Ansichten

Zusatzfenster

Layer

Abbildung

Oberfläche

Gitterlinien

Symbolleisten

Aktualisieren

Eigenschaften


Neues Fenster
Fenster / Neues Fenster

Verwenden Sie diesen Befehl, um ein weiteres Fenster für das aktuelle Projekt zu öffnen.

Verwenden Sie diesen Befehl, um ein neues Fenster mit demselben Inhalt wie im aktiven Fenster zu öffnen. Sie können mehrere Fenster öffnen, um verschiedene Bestandteile oder Ansichten einer Trassendefinition zur selben Zeit anzuzeigen. Wenn Sie den Inhalt in einem Fenster ändern, reflektieren alle anderen Fenster, die dieselbe Graphikansicht enthalten, diese Änderungen. Wenn Sie ein neues Fenster öffnen, wird es zum aktiven Fenster und im Vordergrund vor allen anderen geöffneten Fenstern angezeigt.


Überlappend
Fenster / Überlappend

Verwenden Sie diesen Befehl, um die Größe der geöffneten Fenster und Dialogfelder auf dem Desktop zu ändern und um sie überlappend von links oben nach rechts unten anzuordnen.

Wenn Sie die Fenster überlappend anordnen, werden diese schichtweise angeordnet, und Sie können die Fenster-Titelleisten für alle Fenster auf dem Desktop einsehen.


Nebeneinander
Fenster / Nebeneinander

Verwenden Sie diesen Befehl, um die geöffneten Fenster und Dialogfelder auf dem Desktop zu verschieben und deren Größe zu ändern und um sie nebeneinander anzuordnen.


Symbole anordnen
Fenster / Symbole anordnen

Verwenden Sie diesen Befehl, um alle Symbole minimierter Fenster in einem übersichtlichen Muster auf dem Bildschirm anzuordnen. Dieser Befehl ordnet Symbole im unteren Bereich des Fensters an.


Fensterliste
Fenster / Fensterliste

Verwenden Sie den unteren Abschnitt dieses Menüs, um eine Liste derzeitig geöffneter Fenster oder Dialogfelder auf dem Desktop anzuzeigen. Das aktive Fenster oder Dialogfeld weist eine Kontrollmarkierung auf.

Wählen Sie den Namen eines bestimmten Fensters oder Dialogfelds, um es zu aktivieren.


Menü "Fenster"
Menü “Fenster”

Das Menü “Fenster” enthält Befehle für die Ansichtsoptionen. Die folgenden Befehle sind verfügbar:

Neues Fenster

Überlappend

Nebeneinander

Symbole anordnen

Fensterliste


Technische Unterstützung

Wenn Sie ein Problem haben und die benötigten Informationen nicht in der Dokumentation des Produkts finden können, wenden Sie sich an Ihren Trimble-Händler. Sie können alternativ dazu auch technische Unterstützung über die Trimble World Wide Web-Adresse unter www.trimble.com/support/support.html anfordern.


Warenzeichen

Das Globus- & Dreieck-Logo, Trimble, DTMLink, RoadLink, Trimble Geomatics Office, Trimble Survey Controller, TSCe und TSC1 sind Warenzeichen von Trimble Navigation Limited.

Das Sextanten-Logo mit Trimble, Geodimeter und Terramodel sind beim US Patent and Trademark Office eingetragene Warenzeichen von Trimble Navigation Limited.

Alle anderen Marken oder Produktnamen sind Warenzeichen ihrer entsprechenden Eigentümer.


Garantiebestimmungen

Garantieausschluß

Außer in den im folgenden dargelegten “Garantieeinschränkungen”, wird Trimble Hardware, Software, Firmware und die Dokumentation “wie gesehen” angeboten, ohne ausdrückliche oder eingeschränkte Garantie jeglicher Art sowohl von seiten der Trimble Navigation Limited als auch von jeglichen Personen, die an der Erzeugung, Herstellung oder dem Vertrieb beteiligt waren, einschließlich aber nicht begrenzt auf, die angenommenen Garantien auf Verwertbarkeit und Verwendbarkeit für eine bestimmte Anwendung. Das gesamte Risiko für Qualität und Leistungsfähigkeit der Trimble Hardware, Software, Firmware und Dokumentation wird vom Endkunden getragen. In einige Staaten ist der Ausschluß von angenommenen Garantien nicht erlaubt, daher trifft obiger Ausschluß möglicherweise für Sie nicht zu.

Haftungsausschluß

Unter keinen Umständen ist Trimble Navigation Limited oder jegliche Personen, die an der Erzeugung, Herstellung oder dem Vertrieb der Trimble Software beteiligt waren, Ihnen gegenüber für jegliche Art von Schadensersatzansprüchen haftbar, einschließlich Gewinnverlust oder andere spezielle, zufällige, folgende oder über den verursachten Schaden hinausgehende Schäden, einschließlich aber nicht begrenzt auf jegliche Art von Schäden, die gegen Sie entstehen oder für die Sie an Dritte bezahlt haben, hervorgerufen aus der Verwendung entstehenden Haftung, Qualität oder Leistungsfähigkeit solcher Trimble-Software und -Dokumentation, auch dann, wenn Trimble Navigation Limited oder einer solchen Person oder Stelle die Möglichkeit solcher Schäden bekannt gemacht wurde, oder für jeden Anspruch Dritter. Einige Staaten erlauben den Haftungsausschluß für zufällige Schäden oder Folgeschäden nicht, daher treffen diese obigen Ausschlüsse möglicherweise für Sie nicht zu.

Garantieeinschränkungen für Software und Firmware

Trimble Navigation Limited garantiert, daß Software- und Firmware-Produkte die veröffentlichten Spezifikationen im wesentlichen erfüllen, vorausgesetzt sie werden mit den Trimble-Produkten, Computerprodukten und Betriebssystemen betrieben, für die sie entwickelt wurden. Für die Dauer von neunzig (90) Tagen, beginnend dreißig (30) Tagen nach Versand durch Trimble, garantiert Trimble auch, daß der Datenträger, auf dem die Software oder Firmware vertrieben wurde, und die Dokumentation frei von Fehlern in Material und Verarbeitung sind. Während dieser Garantiezeit von neunzig (90) Tagen ersetzt Trimble fehlerhafte Datenträger oder Dokumentationen, oder behebt wesentliche Programmfehler kostenlos. Sollte Trimble den fehlerhafte Datenträger oder die Dokumentation nicht ersetzen oder den Programmfehler nicht beheben können, ersetzt Trimble den für die Software bezahlten Preis. Dies ist Ihr einziger Rechtsanspruch für jeglichen Bruch der Garantie.


World Wide Web-Adresse
World Wide Web (WWW)-Adresse

Besuchen Sie die Trimble World Wide Web-Adresse für einen interaktiven Einblick bei Trimble (www.trimble.com/)


Feedback

Wir bedanken uns für die Wahl dieses Produkts. Wir wären Ihnen dankbar, wenn Sie uns Feedback zukommen lassen würden. Kommentare und Vorschläge können direkt an die folgende Adresse geschickt werden:

Trimble Navigation Limited
Engineering and Construction Division
5475 Kellenburger Road
Dayton, Ohio 45424-1099
U.S.A.
www.trimble.com/

Wenn Sie uns Kommentare und Vorschläge zukommen lassen möchten, nehmen Sie mit uns Kontakt auf. Ihr Feedback trägt zur Verbesserung zukünftiger Revisionen bei.

Senden Sie Ihre Kommentare und Vorschläge an vorstehend genannte Adresse, oder schicken Sie ein E-mail an ReaderFeedback@trimble.com

Alle Kommentare und Vorschläge werden Eigentum von Trimble Navigation Limited.


Erdbaumassen berechnen

Die Erdbaumassen werden unter Verwendung der Durchschnittsendflächenformel berechnet:

wobei

A1 und A2 die effektiven Flächen von zwei Profilen, und L1 ist die Schwerpunktstrecke zwischen ihnen sind.

HINWEIS: Die tatsächlichen Endflächen werden ausgeglichen, um jegliche Verzerrung des Schwerpunkts mit in Betracht zu ziehen, damit eine effektive Fläche geboten werden kann. Effektive Flächenausgleichung wird nicht für horizontale Kurven verwendet. Statt dessen wird L unter Verwendung des Pappus-Theorems berechnet.

HINWEIS: Die Schwerpunktlänge ist die 3D-Strecke zwischen den Schwerpunkten der Endflächen. Der Schwerpunktabstand kann sich in der horizontalen und vertikalen Ebene krümmen. Er kann zudem in der horizontalen und vertikalen Ebene verschoben werden.

Alle Erdbaumassen werden unter Verwendung des Abstands am Schwerpunkt zwischen effektiven Endflächen berechnet. Die Warnmeldung

Abstand am Schwerpunkt ist größer als Stationsunterschied

erscheint, wenn die Erdbaumasse bei einer bestimmten Station unter Verwendung eines Schwerpunktabstands berechnet wird, der größer als der Unterschied zwischen zwei Querprofilen ist, siehe Abb. 1.

Abb. 1  Massen mit Hilfe des Abstands am Schwerpunkt berechnen

Die Meldung erscheint, wenn die Strecke Y die Strecke X überschreitet. Dies kommt vor, wenn sich die Topographie plötzlich ändert oder wenn eine Änderung im angewandten Regelquerschnitt auftritt, wodurch sich die Schwerpunktlängen der Endflächen zwischen nahegelegenen Querprofilen erheblich unterscheiden.

Ihre Reaktion auf diese Meldung ist von der Situation abhängig. Sie könnten z. B.:

  nichts unternehmen

  zusätzliche Querprofile zwischen den zwei Stationen erstellen

  Massen in zwei Durchgängen berechnen, wobei die Teilportion zwischen den zwei Stationen ausgeschlossen wird.

Im allgemeinen können Sie die Meldung ignorieren.


Drehpunkt

Im Feld Drehpunkt können Sie die Drehpunktoption wählen.

Die verfügbaren Optionen sind:

  Kuppe

  Links

  Rechts

Die folgenden drei Abbildungen veranschaulichen diese Optionen:

Abb. 1 : Drehpunkt Kuppe

Abb. 2 : Drehpunkt Links

Abb. 3 : Drehpunkt Rechts


Automatische Überhöhungsentwicklung

Eine Überhöhung kann durch die Festlegung der definierenden Parameter auf eine Kurve angewendet werden. Diese Parameter sind unterschiedlich für kreisförmige und Spiralkurven. In diesem Abschnitt wird beschrieben, wie RoadLink Überhöhungswerte aus festgelegten Parametern berechnet.

Kreisförmige Kurven

Die Überhöhungsentwicklung für eine kreisförmige Kurve basiert auf dem Maximalen Überhöhungswert, der Nicht überhöhten Querneigung und der Ablauflänge der Überhöhung (und ihrer Beziehung zu PC und PT), siehe dazu die nachstehende Abbildung:

Überhöhungsgraphik für eine kreisförmige Kurve

In der nachfolgenden Tabelle wird die in vorstehender Abbildung dargestellte Überhöhungsgraphik beschrieben:

Schlüssel	Beschreibung
1	Nicht überhöhte Querneigung
2	Ablauflänge (Hinein)
3	PC (Wölbungspunkt)
4	Maximale Überhöhung
5	Start der maximalen Überhöhung
6	Prozentsatz der Ablauflänge innerhalb der Kurve (Hinein)
7	Ende der maximalen Überhöhung
8	PT (Tangentenpunkt)
9	Ablauflänge (Hinaus)
10	Prozentsatz der Ablauflänge innerhalb der Kurve (Hinaus)
Beschreibungsschlüssel für die Überhöhungsgraphik

RoadLink erstellt die Überhöhungswerte für eine kreisförmige Kurve automatisch. Dies wird in den nachfolgenden Abschnitten beschrieben:

 RoadLink berechnet aus den bekannten PC- und PT-Stationswerten und den eingegebenen Parametern die Stationswerte Start und End max wie folgt:

Start der maximalen Überhöhung = PC + % der Ablauflänge innerhalb der Kurve (Hinein)

Ende der maximalen Überhöhung = PT – % der Ablauflänge innerhalb der Kurve (Hinaus)

Der Überhöhungswert für die Überhöhungspositionen Start und Ende Maximum (linker und rechter Rand) ist der Wert ‘Maximale Überhöhung’.

  Die Stationswerte ‘X’ Hinein/Hinaus werden wie folgt von den zuvor berechneten maximalen Überhöhungspositionen Start/Ende berechnet:

X Hinein = Start der maximalen Überhöhung – Ablauflänge (Hinein)

X Hinaus = Ende der maximalen Überhöhung + Ablauflänge (Hinaus)

Die verwendeten Überhöhungswerte sind ‘Nicht überhöhte Querneigung’ und 0%.

  Die Stationswerte ‘Y’ Hinein/Hinaus werden wie folgt berechnet:

Y Hinein = X Hinein – (absolute nicht überhöhte Querneigung  x  Ablauflänge / maximale Überhöhung)

Y Hinaus = X Hinaus + (absolute nicht überhöhte Querneigung  x  Ablauflänge / maximale Überhöhung)

Die Überhöhungswerte sind die ‘Nicht überhöhte Querneigung’.

Abschließend werden die Stationswerte ‘Z’ Hinein/Hinaus auf der Grundlage berechnet, daß die Strecke von Y nach X der Strecke von X nach Z wie folgt entspricht:

Z Hinein = X Hinein + (X Hinein – Y Hinein)

Z Hinaus = X Hinaus – (Y Hinaus – X Hinaus)

Die Überhöhungswerte sind die ‘Nicht überhöhte Querneigung’.

Alle Werte können bearbeitet werden, nachdem die Überhöhung angewandt wurde.

Spiralkurven

Die Überhöhungsentwicklung für eine Spiralkurve basiert auf dem maximalen Überhöhungswert und der nicht überhöhten Querneigung. Siehe dazu nachfolgende Abbildung:

Überhöhungsgraphik für eine Spiralkurve

In der nachfolgenden Tabelle wird die in vorstehender Abbildung dargestellte Überhöhungsgraphik beschrieben:

Schlüssel	Beschreibung
1	Nicht überhöhte Querneigung
2	Maximale Überhöhung
3	TS (Tangente zu Spirale)
4	SC (Spirale zu Kreisförmig)
5	CS (Kreisförmig zu Spirale)
6	ST (Spirale zu Tangente)
RoadLink berechnet automatisch Überhöhungswerte für eine Spiralkurve wie folgt:

Die RoadLink-Software berechnet aus den bekannten Stationswerten TS, SC, CS und ST und den eingegebenen Parametern die Stationswerte X Hinein/Hinaus automatisch wie folgt:

X Hinein = TS – (absolute nicht überhöhte Querneigung  x  SC Stationswert  - TS Stationswert / maximale Überhöhung)

X Hinaus = ST + (absolute nicht überhöhte Querneigung  x  ST Stationswert  - CS Stationswert / maximale Überhöhung)

Die Überhöhungswerte für die Positionen X Hinein und X Hinaus sind der Wert ‘Nicht überhöhte Querneigung’.

Abschließend werden die Stationswerte Z Hinein/Hinaus auf der Grundlage berechnet, daß die Strecke von X bis zur Position TS/ST der Strecke von der Position TS/ST nach Z wie folgt entspricht:

Z Hinein = TS + (TS – X Hinein)

Z Hinaus = ST – (X Hinaus – ST)

Die Überhöhungswerte für Z Hinein/Hinaus sind der Wert ‘Nicht überhöhte Querneigung’.

Die Überhöhungswerte für die Positionen TS und ST sind der Wert ‘Nicht überhöhte Querneigung’ und 0%. Die Überhöhungswerte für die Positionen SC und CS sind der Wert ‘Maximale Überhöhung’.

Alle Werte können bearbeitet werden, nachdem die Überhöhung angewendet wurde.