Copyright: © 1999-2002 Trimble Navigation Limited
Citation: © 1999-2002 Trimble Navigation Limited


Ajuste de redes - Indice de materias
 Ajuste de redes − Indice de materias

Se dispone de los siguientes temas:

  Ajuste de redes

  Datum del ajuste

  Estilo de ajuste de redes

  Puntos

  Observaciones

  Grupos de observaciones

  Estrategias de ponderación

  Ajuste

  Coordenadas de calibración

  Quitar Ajuste

  Informe de Ajuste de Redes

Para aprender a utilizar Ayuda, pulse la tecla F1.

Si tiene un problema y no puede encontrar en este sistema de Ayuda la información que necesita, consulte el Manual del usuario para Ajuste de Redes de Trimble Geomatics Office – Ajuste de redes, póngase en contacto con su distribuidor local, o véase Asistencia Técnica.

©1999-2002, Trimble Navigation Limited. Reservados todos lo derechos.


    Ajuste de redes - Visión de conjunto

Más información

 Véase también

Visión de conjunto

La finalidad de realizar un ajuste por mínimos cuadrados de una red es:

  estimar y quitar los errores aleatorios

  proporcionar una solución única cuando existen datos redundantes

  minimizar las correcciones hechas a las observaciones

  detectar equivocaciones y errores grandes

  generar información para el análisis, incluidas las estimaciones de la precisión

Una vez completado y logrado un ajuste por mínimos cuadrados se determinará que:

  no existen equivocaciones ni errores sistemáticos en las observaciones y puntos de control

  cualquier error remanente será pequeño, aleatorio, y adecuadamente distribuido.

Un ajuste por mínimos cuadrados asegura buenos cierres de posiciones y estimaciones de repetibilidad; de esta manera se asegura la fiabilidad de las mediciones actuales y futuras.

Para completar un ajuste logrado, una red de mínimos cuadrados debe satisfacer los siguientes criterios:

  La red debe cerrarse geométrica y matemáticamente.

  La suma de los cuadrados ponderados de los residuales debe ser minimizada.

Cerrar geométricamente la red significa simplemente diseñar la red empleando una buena geometría cerrada.. Una red GPS o terrestre consta de varias observaciones entre puntos de la red. Estas observaciones crean figuras geométricas cerradas tales como triángulos.

Cerrar matemáticamente la red significa simplemente que se han eliminado de las observaciones todos los errores grandes o equivocaciones, asegurando así resultados estadísticos aceptables.

Mantener los cuadrados ponderados en un mínimo se relaciona con cerrar matemáticamente la red diciendo que se debe minimizar la suma de los cuadrados ponderados de los residuales de las observaciones. Expresado simplemente, conforme se ajusta cada una de las observaciones, el ajuste total de todas las observaciones (al cuadrado), debe estar en el valor más bajo posible.

El software Trimble Geomatics Office comprueba estos criterios por usted y le permite saber de cualquier observación o punto de control que impida que el ajuste de redes cumpla los criterios.

Cuándo y por qué ajustar una red

Comience un ajuste de red después de lo siguiente:

  El procesamiento de la línea base GPS (procesamiento de los datos GPS brutos)

  Importar las líneas base RTK (con datos QC1 & QC2) y/o datos terrestres.

  Quitar avisos de error creados a partir de errores fuera de tolerancia.

SUGERENCIA: Trimble le recomienda encarecidamente que antes de iniciar un ajuste lea el Apéndice A, Guía para los ajustes por mínimos cuadrados en el manual del usuario de Ajustes de Redes del software Trimble Geomatics Office.

NOTA: Si antes de realizar un ajuste de red ha completado o importado (de un archivo DC) una calibración local GPS, el programa le pedirá que acepte la eliminación de la calibración local GPS (parámetros) antes de comenzar un ajuste de red. El software Trimble Geomatics Office no le permitirá tener en un proyecto parámetros de transformación de un ajuste de red y parámetros de calibración de una calibración local GPS; puede tener el uno o el otro, pero no ambos a la vez.

Procedimientos para el Ajuste de redes

Los dos procedimientos principales para el Ajuste de redes son:

1.	Comience con un ajuste mínimamente limitado (o ajuste libre cuando se emplean limitaciones internas) para ajustar y realizar una comprobación del control de calidad de las observaciones. Este paso:

  comprueba la consistencia interna de la red

  detecta observaciones erróneas o mal ajustadas

  obtiene estimaciones precisas de los errores de las observaciones

2.	Realice un ajuste totalmente limitado. Este paso:

  relaciona la red con el datum de control existente

  verifica el control existente

  produce parámetros de transformación de red

  obtiene estimaciones precisas de los errores de las coordenadas

Para obtener información acerca de cómo ejecutar un ajuste con una combinación de observaciones GPS y terrestres, vea el tema Ejecutar un ajuste combinado.

NOTA: Tras completar un ajuste mínimamente limitado de observaciones GPS sobre el datum WGS-84, se pueden guardar las coordenadas WGS-84 de los puntos ajustados. Estas coordenadas WGS-84 se guardan para utilizarlas como puntos GPS en una calibración local GPS. Después de generar coordenadas de cuadrículas locales en un ajuste totalmente limitado para su uso como puntos de cuadrículas en calibración, se puede realizar una calibración para su uso en el campo (Replanteo). El programa le pedirá que antes de comenzar una calibración local GPS acepte la eliminación de los parámetros de transformación del ajuste. Asegúrese de que ha terminado el ajuste de la red antes de empezar la calibración local GPS. Para más información, véase Calibración Local GPS.

NOTA: Si pretende ejecutar un ajuste de red usando datos transferidos del software Trimble Survey Controller, verifique que haya introducido las correcciones de presión, temperatura, curvatura y refracción en el estilo usado en el  Survey Controller cuando se ejecute el levantamiento.


Datum - Visión de conjunto
    Datum − Visión de conjunto

Más información

Cómo ...	Véase también
Visión de conjunto

En términos generales, un datum es un cuadro de referencia que sirve para determinar coordenadas para  puntos en la superficie terrestre. Alrededor del mundo se emplean diversos datums locales  para definir coordenadas en un área local. También existen datums que se emplean para definir coordenadas en todo el mundo. Típicamente, los puntos de control conocidos que se utilizan en los levantamientos están basados en un sistema de coordenadas local que emplea uno de los datums locales. Cuando se recolectan observaciones GPS en el campo, las observaciones toman como referencia un datum mundial conocido como WGS-84.

Cuando usted creó su proyecto y definió las propiedades del mismo en el software Trimble Geomatics Office, tuvo que seleccionar un sistema de coordenadas para el proyecto con referencia a un datum local particular (datum del proyecto). El sistema de coordenadas del proyecto, junto con el datum, sirve para generar coordenadas para todos los puntos del proyecto.

Antes de realizar un ajuste de red se puede seleccionar el datum utilizado para los pasos del ajuste mínimamente limitado y totalmente limitado. Para los fines de esta discusión, dicho datum se denomina Datum del ajuste. Como Datum del ajuste se puede seleccionar el WGS-84 o datum del proyecto. La selección de un Datum del ajuste se aplica sólo al ajuste.

Si está ejecutando un ajuste mínimamente limitado de observaciones GPS, use el datum WGS-84; el datum utilizado por el Sistema de posicionamiento global. La utilización de un datum distinto del WGS-84 hace que el ajuste aplique más o menos residuales a cada observación, para compensar las diferencias en el marco de referencia.

Debe seleccionar el datum correcto para cada paso en el ajuste; esto es:

  Seleccione el datum WGS-84 antes de ejecutar el paso mínimamente limitado con Datos GPS.

  Seleccione el datum del proyecto antes de ejecutar un ajuste mínimamente limitado con datos terrestres. (Si el datum seleccionado para el ajuste mínimamente limitado no es el datum del proyecto, el datum del proyecto se selecciona antes de ejecutar un ajuste totalmente limitado.)

NOTA: WGS-84 puede utilizarse como datum del proyecto. En algunos levantamientos se usan puntos de control referenciados a un sistema de coordenadas que utiliza el WGS-84 como su datum. En este caso, la selección de un datum para los pasos de ajuste mínimamente limitado y totalmente limitado son uno y el mismo—la selección de cualquiera de las dos opciones de datum consigue los mismos resultados.

NOTA: El resumen de coordenadas de cuadrícula y locales en propiedades del proyecto se muestran siempre utilizando el sistema de coordenadas seleccionado para el proyecto. La selección de WGS-84 como Datum del ajuste no tiene efecto sobre la presentación de las coordenadas de cuadrícula y locales.

Para más información, véase Seleccionar un datum.


    Datum WGS-84

Más información

Cómo ...	Véase también
Visión de Conjunto

Si está ejecutando un ajuste mínimamente limitado de observaciones GPS, utilice el datum WGS-84 (el datum usado por el Sistema de Posicionamiento Global).

Si no usa el datum WGS-84 al ajustar las líneas base GPS, el ajuste produce diferentes resultados de ponderación. Esto ocurre por que las diferencias de datum quedan incluidas en las observaciones durante el proceso de modelación de líneas base.

Para más información, véase Seleccionar un datum.


    Datum del proyecto

Más información

Cómo...	Véase también
Visión de Conjunto

El datum del proyecto se selecciona en la página Sistemas de coordenadas del diálogo Propiedades Proyecto.

Tras realizar un ajuste mínimamente limitado inicial, seleccione el datum del proyecto como el datum de ajuste.

El paso de ajuste totalmente limitado aplica los parámetros de transformación requeridos para:

  referenciar las observaciones GPS (WGS-84) al sistema de coordenadas local (datum del proyecto).

  transformar las observaciones terrestres para que calzen en su control local.

Durante este paso del ajuste se pueden limitar los puntos de control referenciados al datum del proyecto, efectivamente transformando las observaciones (referidas a WGS-84) al datum del proyecto seleccionado.

Para más información, véase Seleccionar un datum.


Grupos de observaciones - Visión de conjunto
    Grupos de observaciones − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

El software de Ajuste de Redes le permite separar conjuntos de observaciones en grupos. Se pueden crear los siguientes tipos de grupo:

  Grupos de varianza

  Grupos de transformación

La separación de observaciones en grupos permite evaluar mejor los errores en cada tipo de observación.

Grupos de varianza

En los levantamientos existen a veces distintos grupos de mediciones que se emplean en una sola red. El ajuste debe tomar en cuenta de alguna forma las diferencias de errores asociadas con estas mediciones GPS. En el software Trimble Geomatics Office, los grupos de varianza permiten separar estas observaciones en grupos.

Es fácil ver que cuanto más precisos sean los métodos para los levantamientos, menores serán los errores en las mediciones.

El procesador de ajustes determina un factor de referencia y un valor de grados de libertad independientes para cada grupo. Estos valores muestran cómo contribuye cada grupo al ajuste de redes en general. Cada grupo se puede escalar individualmente mediante la opción Grupos de Varianza para el control Aplicar Escalares a en el diálogo Estrategias de Ponderación.

Por defecto, las observaciones GPS, terrestres y de geoide se separan automáticamente en grupos de varianza por defecto (el grupo <GPS por defecto>, <Terr. por defecto>, y el grupo <Geoide por defecto>).

NOTA: El grupo <Geoide por defecto> será siempre el único grupo de varianza de geoide disponible en cualquier ajuste de redes. Dado que para interpolar cada observación de geoide del mismo modelo geoidal se emplea el mismo método, no es necesario separarlos en múltiples grupos.

NOTA: Si tiene observaciones a través de líneas muy cortas (<25 metros), Trimble le recomienda crear grupos de varianza separados para estas observaciones de modo que se les asigne una escala separadamente.

Grupos de Transformación

Los grupos de transformación son selecciones de observaciones sometidas colectivamente a la misma transformación o conjunto de transformaciones durante un ajuste. Cada grupo de transformación tiene un conjunto de parámetros de transformación  que pueden aplicarse individualmente o en conjuntos para transformar las observaciones dentro de un grupo de transformación.

Los grupos de transformación aplicados a cada grupo se pueden controlar definiendo uno o más de los parámetros de transformación. Si sólo interesa aplicar transformaciones a los parámetros de desvío se puede configurar el Estado de cada parámetro de transformación de desvío como Calculado y dejar los demás parámetros configurados como Sin usar.

Por defecto, estos parámetros de transformación se configuran como Calculado para grupos de transformación de observaciones GPS:

  Desvío en Longitud

  Desvío en Latitud

  Rotación de Acimut

  Escala de la Red

Por defecto, sólo la Rotación de Acimut se configura a Calculada para observaciones terrestres. Otro tipo de parámetros también pueden configurarse a definidos por el usuario o calculados, pero sólo se usan cuando existe un error sistemático en las observaciones. Por ejemplo, cuando un ajuste se ejecuta y todas las distancias (medidas por técnicas terrestres) tienen un residual de +3ppm, un parámetro de escala de distancia puede ser calculado ya que existe un error sistemático en el grupo de datos. Este error sistemático puede producirse por la configuración ppm en la EDM no aplicada.

NOTA: El software Trimble Geomatics Office le permite introducir parámetros de transformación definidos por el usuario. Trimble le recomienda que tenga pleno entendimiento de los parámetros de transformación antes de intentar definir Valores manualmente introducidos para cualquier tipo de parámetros.

Para más información acerca de Parámetros de Transformación, vea el tema Parámetros de Transformación – Visión de Conjunto.


Informe de ajuste de redes - Visión de conjunto
    Informe de Ajuste de Redes − Visión de conjunto

Más información

Véase también	Diálogo
Visión de conjunto

Utilice este informe para ver los mensajes y estadísticas generadas mientras realiza ajustes de redes.

Para ver el Informe de ajuste de redes:

  Seleccione Informe / Informe de ajuste de redes.

Se iniciará el visor HTML de su computadora y aparecerá el Informe de ajuste de redes.

Una vez que aparezca el informe puede usar los comandos del visor HTML para navegar a estas secciones:

  Configuraciones de Estilos de Ajuste

  Tolerancias Residuales

  Presentación de Covarianza

  Controls Terrestres

  Errores de Configuración

  Resumen Estadístico

  Número de Iteraciones

  Estadísticas Globales

  Estadísticas de Observación GPS

  Estadísticas del Modelo de Geoide

  Estadísticas de Observaciones Terrestres

  Estrategias de Ponderación

  Coordenadas Ajustadas

  Coordenadas de Cuadrícula

  Coordenadas Geodésicas

  Deltas de Coordenadas

  Comparaciones de Coordenadas de Control

  Observaciones Ajustadas

  Observaciones GPS

  Observaciones de Geoide

  Observationes Terrestres

  Histogramas para Residuales Estandarizados

  Elipses de Error de Puntos

  Valores de Covarianza

Con los temas antes mencionados se incluyen normas para evaluar las estadísticas del informe.

NOTA: Puede seleccionar observaciones periféricas en la vista de Levantamiento tras seleccionarlas en el informe de Ajuste de Redes. Para hacer ésto, seleccione el ID de observación en el informe de Ajuste de Redes (para seleccionar observaciones multiples, use la tecla Ctrl). Se borra la selección actual en la vista de Levantamiento y se reemplaza por la(s) observación(es) seleccionadas en el informe.


Ajuste - Visión de conjunto
    Ajuste − Visión de conjunto

Más información

Cómo ...	Véase también
Visión de conjunto

Utilice el comando Ajustar para empezar el proceso de ajuste.

Para empezar un ajuste, use una de las siguientes alternativas:

  En el menú Vista del levantamiento, seleccione Ajuste / Ajustar.

  Pulse F10.

  En la barra del proyecto, seleccione el grupo Ajuste, y haga clic en el icono Ajustar.

Una vez iniciado el proceso, todas las iteraciones de ajuste se realizan automáticamente. Utilice la barra de estado para supervisar el estado del Ajuste de redes; conforme se realiza cada iteración de ajuste aparecerán mensajes.

A lo sumo, el procesador de ajustes realiza el máximo número de iteraciones definido en el estilo de ajuste. Durante cada iteración se comprueba el residual de cada observación para determinar si coincide con la tolerancia definida en el estilo de ajuste. El proceso de ajuste termina en menos iteraciones si la red converge antes de que transcurra el número máximo de iteraciones.

Una vez que los residuales de las observaciones pasan los criterios de la prueba de aceptación, la red converge y se realizan las siguientes funciones:

  Los valores ajustados para cada punto se guardan en el proyecto como valores actuales de las coordenadas, tomando los puntos la calidad de Ajustados.

  Se crea un subregistro adicional de coordenadas para cada punto del ajuste. El tipo del subregistro se basa en los siguientes criterios:

  Si se fija un punto en el ajuste y éste no ha sido importado mediante una hoja de datos NGS o como punto de control en una archivo ASCII, también se guarda un subregistro tecleado.

  Los valores de ajuste para cada punto en el ajuste de redes pasan a ser un valor de coordenada cuya calidad de punto es ajustado. Las coordenadas del punto limitado y la calidad del punto (control) permanecen según se hubieran introducido previamente.

  En la ventana Propiedades, se crea una hoja de coordenadas de ajuste para cada punto en el ajuste. Se asigna una calidad de punto de tipo Ajustada a todas las componentes limitadas de un punto. Todas las componentes limitadas son Nulas.

  Se realiza automáticamente un recálculo. El recálculo determinará nuevas coordenadas para todos los puntos que no estén en la red. Las nuevas coordenadas se calculan utilizando las observaciones que no pertenecen a la red, propagándose a partir de las coordenadas ajustadas (y fijas).

  El símbolo para los puntos ajustados cambia a un círculo amarillo continuo.

  Se generan elipses de error y flechas para cada punto en el ajuste.

  Se guardan todos los demás puntos en el ajuste de redes.

  Los símbolos para los puntos ajustados cambian; círculos amarillos sólidos aparecen cuando la ventana Gráficos tiene un fondo negro y círculos azules sólidos con el fondo por defecto.

  Se generan Elipses de Error para cada punto ajustado en el ajuste (no para los puntos horizontales fijos).

Los valores ajustados están disponibles para su examen en la hoja de propiedades para cada punto. Si está activada la opción de presentación Elipses de error, éstas se muestran en cada punto ajustado en la ventana Gráficos.

Ahora se puede empezar el análisis de los resultados del ajuste de redes examinando el Informe de ajuste de redes.


Estrategias de ponderación - Visión de conjunto
    Estrategias de ponderación − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Las estrategias de ponderación permiten definir el método para aplicar ponderación y escala a cada tipo de observación; GPS, terrestre y geoide. El software Trimble Geomatics Office permite definir estrategias de ponderación independientes para cada tipo de observación.

Es importante ponderar cada observación según su tipo de observación y calidad. Esto permite al ajuste escalar debidamente cada estimación del error a priori de cada observación. Al definir las estrategias de ponderación se puede aplicar un escalar a estas observaciones:

  Todas las observaciones

  Cada observación

  Grupos de varianza

Típicamente se aplicará el tipo escalar a todas las observaciones o a grupos de varianza, dependiendo de los métodos utilizados durante el levantamiento. Cuando configura la opción Aplicar escalar a cada observación, la opción Tipo de escalar definido por el usuario queda inhabilitada. La aplicación del escalar a cada observación se emplea, típicamente, sólo con fines de análisis. La aplicación a cada observación puede ayudar a encontrar una observación individual que esté creando problemas en el Ajuste de redes.

Una vez seleccionado un método para aplicar un valor escalar se puede definir el tipo escalar utilizado en el ajuste. Se pueden seleccionar los siguientes tipos escalares:

  Por defecto

  Alternativo

  Definido por usuario

  Automático

En algunos ajustes las estimaciones de error a priori calculadas para un grupo de observaciones son subestimadas. La utilización de la estrategia de ponderación correcta permite escalar las estimaciones a priori, estimando así los errores correctos para todas las observaciones.

Al iniciar un ajuste, la estrategia de ponderación por defecto se configura como Aplicar el tipo escalar Por defecto a todas las observaciones. El escalar Por defecto simplemente multiplica por 1.00 el error a priori, dejando sin cambio las estimaciones de errores.

Si el error estimado en las observaciones coincide con el error real, el factor de referencia presentado debe ser aproximadamente 1.00. Una vez realizado el ajuste, puede percatarse de que el factor de referencia no está próximo a 1.00, lo que indicaría que se requiere algún tipo de escala para hacer coincidir el error estimado con el error real. La forma más simple de aplicar el escalar consiste en seleccionar el tipo escalar Alternativo. El tipo escalar Alternativo utiliza el factor de referencia del ajuste actual, multiplicado por el escalar previo, para  determinar el escalar para el ajuste siguiente. Esto acerca efectivamente a 1.00 el factor de referencia. El escalar Alternativo se aplica a las iteraciones de ajustes sucesivos hasta que el factor de referencia sea aproximadamente 1.00 y pase la prueba de chi cuadrada. La opción tipo de escalar automático automatiza este proceso.

NOTA: Antes de utilizar el tipo escalar Alternativo, el factor de referencia del primer ajuste debe tener un valor aceptable. Típicamente, un factor de referencia alto indica la presencia de un error grande en el ajuste. Antes de iniciar el siguiente ajuste compruebe la existencia de periféricos (esto es, observaciones con residuales altos). La aplicación de un tipo escalar Alternativo a un ajuste con un factor de referencia alto hace que el escalar aumente a un valor inaceptable.

Una vez que el factor de referencia sea aceptable y la prueba de chi cuadrada pase, se puede bloquear el último escalar calculado. Al bloquear el escalar, el tipo de escalar se configura automáticamente como Definido por usuario.

CUIDADO: Tenga cuidado al seleccionar el tipo escalar Definido por usuario e introducir valores escalares. Antes de utilizar el tipo escalar Definido por usuario debe tener un conocimiento completo de las estimaciones errores, de las estrategias de ponderación, y de los escalares.


    Commandos - Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Todos los comandos necesarios para realizar un ajuste de redes están ubicados en el menú Ajuste. El comando para generar un informe Ajuste de redes está en el menú Informes. Los comandos para el ajuste de redes están listados en el orden general en que serán utilizados para realizar los pasos de un ajuste. Utilice los comandos de Ajuste de redes para ser guiado a lo largo de un ajuste de la red.

En el menú Ajuste están disponibles los siguientes comandos:

  Datum

  WGS-84 (Datum)

  Datum del proyecto

  Estilos de ajuste

  Puntos

  Observaciones

  Grupos de observaciones

  Groupos de transformación

  Grupos de varianza

  Estrategias de ponderación

  Ajustar

  Coordenadas de calibración

  Guardar (Calibration Coordinates)

  Quitar (Calibration Coordinates)

  Quitar valores ajustados

Este comando está disponible en el submenú Ver / Barras de herramientas:

  Controles de elipse

NOTA: El seleccionar el comando Elipses de Error es lo mismo que seleccionar la casilla Mostrar elipses de error de puntos & flechas en el diálogo Ver Opciones − ficha Controles de Elipse de Error.

Estos comandos están disponibles en la barra de herramientas Controles de elipse:

  Elipses de Error

  Errores de Altura

  Errores de Elevación

Este comando está disponible en el menú Informe:

  Informe de ajuste de redes

Este comando está disponible en el diálogo Observaciones:

  Inhabilitar observaciones

NOTA: El comando Inhabilitar observaciones equivale a cambiar a Inhabilitada el estado de una observación en la ventana Propiedades. Las observaciones inhabilitadas sólo pueden ser rehabilitadas en la ventana Propiedades. Para más información, véase Inhabilitar observaciones y Rehabilitar Observaciones inhabilitadas.


Parámetros de transformación - Visión de conjunto
    Parámetros de Transformación − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Las transformaciones se calculan y se aplican durante el paso ajuste totalmente limitado, basado en las configuraciones de los parámetros de transformación seleccionados para grupos transformación individuales. Cada grupo de transformación incluye una selección de observaciones GPS, terrestres, o de geoide y un conjunto asociado configuraciones de parámetros de transformación que, una vez  calculados, podrían ser aplicados a las observaciones de los grupos de transformación.

Cada grupo de transformación tiene siete parámetros. Estos siete parámetros de transformación incluyen cada uno un campo Valor que puede ser utilizado opcionalmente para definir el valor del parámetro de transformación aplicado durante un ajuste totalmente limitado. Cada campo Valor tiene asociada una configuración de Estado que determina si el valor en el campo Valor es Indefinido, Calculado, Definido por usuario.

Están disponibles los siete parámetros siguientes:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut (GPS only)

  Escala de la red (sólo GPS)

  Escala de distancia (sólo GPS)

  Constante de distancia  (sólo GPS)

  Constante de altura

Los cuatro primeros parámetros se utilizan generalmente para transformaciones de datums, tales como la transformación del datum WGS-84 a un datum del proyecto (local). Los desvíos controlan inclinación en el horizonte, la rotación de acimut se aplica a los acimutes, y la escala de la red se aplica a todas las observaciones lineales (distancia y altura).

Los tres parámetros restantes se utilizan generalmente para resolver los posibles errores sistemáticos en un grupo de observaciones.

Por defecto, estos parámetros de transformación se configuran a Calculados para grupos de transformación de observaciones GPS:

  Deflección de Longitud

  Deflección de Latitud

  Rotación de Acimut

  Escala de la Red

Por defecto, sólo la rotación de acimut se configura a Calculada para observaciones terrestres. Se pueden configurar otros parámetros a definidos por el usuario o calculados, pero sólo se usan cuando se encuentra un error sistemático en las observaciones. Por ejemplo, cuando se ejecuta un ajuste y todas las distancias (medidas a través de técnicas terrestres) tienen un residual de +3 ppm, un parámetro de escala de distancia puede calcularse por que existe un error sistemático en el conjunto de datos. Este error sistemático se puede haber originado por la configuración de ppm en el EMD no aplicado.

NOTA: La rotación de acimut, escala de la red, escala de distancia, y parámetros constantes distantes no se usan para transformaciones de geoide.

La configuración del estado de un parámetro como Calculado no significa que el parámetro haya sido calculado y aplicado durante el paso de ajuste totalmente limitado. El software evalúa el número de limitaciones en la red y determina si está disponible la cantidad de limitaciones requeridas para calcular un parámetro.  Por ejemplo, los desvíos requieren fijar al menos tres coordenadas verticales en la red. Si hay menos de tres coordenadas verticales que se mantengan fijas, no se calculan ni se aplican los parámetros de desvío.

La configuración de Estado Definido por usuario permite predefinir cualquiera de las transformaciones, o todas ellas, que han de aplicarse a un grupo de transformación. Si el estado se configura como Definido por usuario, el valor introducido se aplica a la observación y no se calcula durante el ajuste.

NOTA: Aunque el software Trimble Geomatics Office permite introducir parámetros de transformación Definidos por usuario, antes de intentar definir cualquier parámetro de transformación hay que tener un conocimiento completo de los parámetros de transformación.

Cuando se genera un Informe de ajuste de redes, el estado de un parámetro dicta cómo ha de presentarse su valor. Se genera uno de los siguientes o todos ellos:

  Si el Estado de cualquier parámetro se configuró como Sin usar, el valor del parámetro no se incluye en las secciones de Observaciones ajustadas del informe.

  Si el Estado de cualquier parámetro se configuró como Calculado y el ajuste no fue capaz de calcular un valor de parámetro debido a disponer de insuficientes limitaciones, en las secciones de Observaciones ajustadas del informe no se incluirá ningún valor. Cuando el ajuste sea capaz de calcular los parámetros, el valor del parámetro se incluirá en las secciones de Observaciones ajustadas del informe.

  Si el Estado de cualquier parámetro se configura como Definido por usuario, el valor del parámetro introducido se incluye en el informe con independencia del número de limitaciones.

SUGERENCIA: Los parámetros de transformación pueden verse también en la ficha Ajuste de la ficha detallada Sistema de coordenadas, en la ventana Propiedades del proyecto.

NOTA: Cuando se selecciona una observación, la observación observada se presenta en la ventana Propiedades. La observación ajustada o transformada no está disponible para su examen en la ventana Propiedades.

Para más información, véase Definir Parámetros de Transformación.


Coordenadas de calibración - Visión de conjunto
    Coordenadas de Calibración − Visión de Conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

El guardar coordenadas de calibración le permite almacenar coordenadas GPS en el datum WGS-84 para un punto. Después de terminar un ajuste mínimamente limitado  se pueden guardar las coordenadas de los puntos ajustados. Tras completar el ajuste totalmente limitado en el datum local, puede guardar las coordenadas de cuadrícula para el punto.

NOTA: La opción Guardar coordenadas de calibración sólo está disponible si el datum de ajuste se configura a WGS-84, y sólo se han ajustado observaciones GPS.

Para la creación de coordenadas de calibración se dispone de estos dos métodos:

  Puntos existentes

  Puntos nuevos con sufijo

Guardar coordenadas para un grupo de calibración incluye estas opciones:

Puntos existentes

Si se elige guardarlas bajo Puntos existentes, las coordenadas se guardan bajo el registro de puntos correspondiente. Sólo se utilizan estas coordenadas para posicionar el punto si no hay otros datos de levantamiento disponibles. Se guardan para calibración solamente.

Si los puntos se guardan bajo puntos existentes, la lista de Puntos en el diálogo de Calibración Local GPS queda completada automáticamente.

Puntos nuevos con sufijo

Si se elige guardar las coordenadas bajo Puntos nuevos con sufijo: GPS, se crea un nuevo registro de punto con el nombre de punto "<Nombre de punto>-GPS". Se pueden utilizar para deducir la posición del punto. Sólo se utilizan estas coordenadas para posicionar el punto si no hay otros datos de levantamiento disponibles. Se guardan para calibración solamente.

Use esta opción para mantener los puntos GPS y de cuadrícula para una calibración local GPS como entidades distintas.

Cómo Ver las Coordenadas de Calibración

Una vez que se guardan las coordenadas de calibración en el proyecto, puede ver las propiedades de los puntos de calibración en la ventana de Propiedades.

Cómo Quitar las Coordenadas de Calibración

También puede quitar las coordenadas de calibración. El comando de Coordenadas de Calibración en el menú de Ajuste muestra un submenú con el comando Quitar para quitar las coordenadas de calibración del proyecto.


    Página de Coordenadas generada por Ajuste de Redes

Más Información

 Véase también

Visión de Conjunto

Cuando se realiza un Ajuste de redes se generan coordenadas ajustadas para cada punto no limitado en el ajuste. Puede ver las coordenadas ajustadas en la Ventana Propiedades.

La coordenada ajustada es generada en el datum de ajuste actual. Por ejemplo:

  Si el ajuste de red se ejecuta sobre un datum WGS-84, se crea un ajuste de coordenadas WGS-84.

  Si el ajuste de red se ejecuta sobre el datum del proyecto, se crea una cuadrícula de ajuste.

NOTA: Se le da un calidad fija de control a las coordenadas que han sido fijadas en el diálogo de Puntos .   No puede editar estas coordenadas.

Las coordenadas de calidad de Ajuste se usan antes de las coordenadas de control desfijadas. Se quitan antes de realizar más ajustes, y cuando el ajuste es finalmente quitado.


La importancia de la Homogenización de Coordenadas en Ajustes de Red

Antes de ajustar los datos en su proyecto de Trimble Geomatics Office, debe primero importar puntos de control de buena calidad. Esto es porque después de importar sus datos al software, debe llevar a cabo un recálculo para determinar la posición calculada de los puntos importados, y el software usa los puntos de control para sus cálculos.

Coordenadas de mala calidad pueden llevar a una escala no adecuada de las observaciones durante el modelamiento de líneas base, lo que puede a su vez conducir a resultados erróneos del ajuste de red. Los errores de las coordenadas verticales producen errores en la escala durante el modelamiento.

Para prevenir que coordenadas de mala calidad se pasen al ajuste, verifique que:

  las observaciones sean de coordenadas de alta calidad

  los datos sean homogéneos; esto es, que no existan errores de cierre en los datos

Si trata de ejecutar un ajuste cuando existan errores de cierre en su proyecto, el diálogo de advertencia de datos no homogéneos aparece. Quite todas las no homogeneidades antes de proceder con su ajuste mínimamente limitado.

NOTA: El software verifica la no homogeneidad sólo durante un ajuste con escalares por defecto. Si edita los datos y pretende ejecutar otro tipo de ajuste, verifique que se haya seleccionado la opción de escalar por Defecto (en las fichas GPS, Terrestres, y de Geoide) en el diálogo de Estrategias de Ponderación.


Mensajes de Error de Ajuste Fallido

Visión de Conjunto

Los siguientes mensajes de error pueden aparecer cuando se ejecuta un ajuste:

  Ajuste Fallido − No hay convergencia

  Ajuste Fallido − Inestabilidad de coordenadas horizontales o verticales

  Ajuste Fallido − Inestabilidad de transformación

Existen muchas razones por las que pueden ocurrir los tres errores durante un ajuste. Utilice los mensajes para identificar puntos problemáticos en su ajuste, y luego investigue sus datos.

Ajute Fallido − No hay convergencia

Se completa un ajuste cuando las coordenadas de puntos ajustados no cambian de una iteración de ajuste a la siguiente. Este mensaje aparece cuando las coordenadas para los puntos en el ajuste están cambiando más que las tolerancias residuales. Puede existir una equivocación en los datos lo que ocasiona que el ajuste no converja. Por ejemplo:

  Las coordenadas no ajustadas para un punto puede que no estén cerca de los valores ajustados.

  Puede existir un error en una observación (por ejemplo, un acimut observado puede ser incorrecto en 180 grados).

Necesita asegurarse de que todas las equivocaciones desaparezcan antes del ajuste.

Este mensaje también puede aparecer debido a ángulos que tienen distancias observadas más cortas que 25 metros en el ajuste. Eleve "Tolerancias Residuales para Finalizar Iteraciones" a un valor que acomode al cambio de coordenadas (1.0 e-3 m).

Ajute Fallido − Inestabilidad de coordenadas horizontales o verticales

Este mensaje aparece por que se detectó un error matemático en los cálculos del ajuste.

El mensaje le indica si el problema está en una coordenada vertical u horizontal, e identifica el punto que causó el error. Examine su red, identifique el punto problemático, e investigue sus datos.

Ajute Fallido − Inestabilidad de transformación

Este mensaje aparece por que se detectó un error matemático en los cálculos del ajuste. Este mensaje le indica que parámetro causó el problema, y el nombre del grupo de transformación.

Este mensaje puede aparecer si la porción GPS de una red no está totalmente integrada a la porción terrestre. Por ejemplo, esto puede ocurrir en una red combinada de observaciones GPS y terrestres cuando la parte terrestre de la red consiste en dos o más segmentos no conectados entre sí. Para más información, vea el tema Cómo combinar diferentes tipos de observaciones en un ajuste de red.

Verifique que existan suficientes observaciones para unir las observaciones GPS y terrestres y/o apagar las transformaciones GPS. Alternativamente, resuelva el problema restringiendo las coordenadas para un punto directamente conectado a la porción GPS.


Diálogo Estilos de ajuste de redes - Visión de conjunto
    Diálogo Estilos de ajuste de redes − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Utilice este diálogo para seleccionar, ver, crear, copiar, editar, renombrar y eliminar estilos de ajuste. El estilo en vigor se denomina estilo activo. Las configuraciones definidas para el estilo activo se aplican siempre al siguiente ajuste.

Se puede crear una biblioteca de estilos para realizar los diferentes tipos de ajustes y compartir esos estilos entre múltiples proyectos.

Para ver el diálogo Estilos de Ajuste de Red:

  Seleccione Ajuste / Estilos de ajuste.

Están disponibles las siguientes opciones:

Estilo activo

Utilice este campo para identificar el estilo activo actual para el ajuste de redes. Los nuevos estilos activos se seleccionan en la lista de estilos y aparecen en este campo. Este campo solo sirve para fines de presentación y no puede editarse.

Lista de estilos

Seleccione el estilo activo en esta lista. Una vez que el estilo esté activo se puede seleccionar uno de los botones del lado derecho del diálogo para editar, copiar, renombrar o eliminar el estilo.

Si se selecciona un estilo y se hace clic en Aceptar, el estilo pasa a ser el estilo activo para el ajuste.

El software Trimble Geomatics Office dispone de varios estilos de ajuste predefinidos. Estos se pueden copiar para utilizarlos como base para crear nuevos estilos, o se pueden crear nuevos estilos propios. Todos los estilos de ajuste pueden editarse.

Los estilos de esta lista no se guardan en el proyecto, sino que se almacenan en el Registro de Windows, en el que se pueden utilizar para múltiples proyectos.

Editar

Haga clic en este botón para ver o editar estilos. Tras seleccionar este botón, el estilo seleccionado en la lista de estilos pasa a ser el estilo activo y aparece el diálogo Editar estilo de ajuste con opciones para editar el estilo de ajuste.

Nuevo

Haga clic en este botón para crear un nuevo estilo de ajuste. Cuando se hace clic en este botón aparece el diálogo Nuevo estilo.

Una vez elegido el nombre del nuevo estilo, éste pasa a ser el estilo activo y aparece el diálogo Editar estilo de ajuste, con opciones para editar el  estilo de ajuste. Para más información, véase Creación de estilos.

NOTA: El estilo ‘Límites de confianza del 95%’ se usa como estilo por defecto al crear  nuevos estilos.

Copiar

Haga clic en este botón para copiar el estilo activo y utilice éste como base para la creación de un nuevo estilo de ajuste. Cuando se hace clic en este botón, la copia del estilo pasa a ser el estilo activo y aparece el diálogo Copiar estilo.

Una vez elegido el nombre, aparece el diálogo Editar estilo de ajuste con opciones para la edición del estilo de ajuste. Para más información, véase Copia de estilos.

Renombrar

Haga clic en este botón para mostrar el diálogo Renombrar estilo. Utilice el campo Nombre para introducir el nuevo nombre de estilo. Cuando se hace clic en Aceptar se renombra el estilo en el Registro de Windows, el estilo pasa a ser el estilo activo, y el nuevo nombre aparece en el campo Estilos activos. Para más información, véase Renombrar estilos.

Eliminar

Haga clic en este botón para eliminar el estilo activo. Los estilos eliminados se quitarán permanentemente del Registro de Windows y ya no estarán disponibles. Para más información, véase Eliminar estilos.


Diálogo Editar estilo de ajuste - Visión de conjunto
    Diálogo Editar estilo de ajuste − Visión de conjunto

Más  información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Utilice este diálogo cuando desee ver o editar el estilo de ajuste activo.

Para ver el diálogo Editar estilos de ajuste:

1.	Para ver el diálogo Estilos de ajuste de redes, seleccione Ajuste / Estilos de ajuste.

Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo de la lista de estilos.

Haga clic en Editar.

Aparecerá el diálogo Editar estilos de ajustes.

Están disponibles las siguientes fichas:

General

Seleccione esta ficha para ver o editar las tolerancias de residuales, los escalares sigma, y las propiedades generales para un estilo de ajuste. Para más información, véase General.

Presentación de covarianzas

Seleccione esta ficha para ver o editar las opciones bidimensionales y tridimensionales para la presentación de la covarianza para el estilo de ajuste. Para más  información, véase Presentación de covarianzas.

Controles Terrestes

Seleccione esta ficha para ver o editar las configuraciones de error estándar, y para seleccionar el tipo de ajuste (horizontal, vertical o ambos) que se lleva a cabo. Para más información, vea Controles Terrestres.

Errores de instalación

Seleccione esta ficha para ver o editar los errores conocidos de altura de antena, centrado de antena, altura del instrumento, y centrado del instrumento (plomada). Estas definiciones se aplicarán globalmente a todas las observaciones para compensar los errores al calcular ajustes. Para más  información, véase Errores de instalación.


Diálogo Editar estilo de ajuste - Ficha General
    Diálogo Editar estilo de ajuste − Ficha General

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice esta ficha para definir las tolerancias de residuales, escalares sigma y propiedades generales, para un estilo de ajuste.

Para ver la ficha General del diálogo Editar estilo de ajuste:

1.	Para ver el diálogo Estilos de ajuste de redes, seleccione Ajuste /  Estilos de ajuste.

Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo en la lista de estilos.

3.	Haga clic en Editar. Aparecerá el diálogo Editar estilo de ajustes.

4.	Seleccione la ficha General.

Están disponibles las siguientes opciones:

Usar perfil Columna reducida

Seleccione esta casilla de verificación para reducir la cantidad de memoria de computadora requerida para ajustar una red. Para redes grandes, esta opción disminuye la cantidad de tiempo necesario para completar un ajuste.

NOTA: Esta opción emplea una combinación de algoritmos desarrollados por el Servicio Geodésico Nacional de los EE.UU. (NGS).

La utilización de esta opción no tiene efecto alguno en los resultados finales del ajuste, excepto que no permite mostrar los términos de covarianza entre puntos no conectados por observaciones.

Cuando se utiliza esta opción se debe Fijar al menos un punto de control horizontal y un punto de control vertical.

Si lleva a cabo un ajuste libre (uno sin coordenadas fijas), entonces no puede usar la opción Utilizar perfil de columna reducida. Para ajustes libres se ignora el interruptor en la ficha general del diálogo de Estilos de Ajuste y el ajuste procede sin utilizar perfiles de columnas reducidas.

Restringir términos de covarianza a líneas observadas

Seleccione esta casilla de verificación para limitar la presentación de términos de covarianza. La utilización de esta opción no tiene efecto alguno en los resultados finales del ajuste, excepto que no permite mostrar los términos de covarianza entre puntos no conectados por observaciones.

Cuando se borra la marca en la casilla de verificación se calculan los términos de covarianza entre cada permutación posible de pares de puntos en la red. Para redes grandes, la lista de términos de covarianza en el Informe de ajuste podría llegar a ser muy larga.

Calcular Correlaciones para el Modelo Geoidal

Cuando se utilizan observaciones geoidales en un ajuste, mantenga fijas las coordenadas verticales (altura y elevación) de modo que pueda existir una solución sobredeterminada y un residual del geoide pueda ser calculado para los puntos restringidos.

Cuando se selecciona la casilla de verificación de Calcular correlaciones para modelo geoidal, se calculan residuales de geoide para puntos con coordenadas verticales sin restricción usando correlaciones de modelo geoidal entre puntos.

Cuando la casilla de verificación no está habilitada, solamente se calculan los residuales para puntos con alturas y elevaciones fijas.

Tolerancias residual

Utilice estas opciones para controlar las tolerancias de residuales usadas durante el proceso de ajuste de la red. Para más  información, véase Tolerancias residuales.

Escalares sigma

Seleccione una opción en la lista para definir los escalares sigma univariadas y bivariadas. Para más información, véase Escalares sigma.

Máximo de iteraciones

Introduzca el número máximo de iteraciones permitidas cuando el ajuste intenta hacer converger la red. El número máximo de iteraciones por defecto es 10.


    Tolerancias residual

Más Información

 Véase también

Visión de Conjunto

Estas opciones controlan las tolerancias de residuales utilizadas durante el ajuste de la red. El ajuste de la red es un proceso iterativo. Se comprueba la convergencia de cada iteración del ajuste basándose en estas tolerancias de residuales:

A iteraciones finales

Introduzca la tolerancia de residuales utilizada para determinar si las iteraciones del ajuste deben continuar o parar.

Tras cada iteración del ajuste se calcula un residual de la observación mediante dos rutinas de software distintas. La diferencia entre los dos cálculos se compara con la tolerancia A iteraciones finales. Basándose en esta comparación tiene lugar una de las siguientes acciones:

  Si la diferencia entre los residuales de observaciones calculados es menor que la tolerancia A iteraciones finales, las iteraciones de ajuste finalizan. En el Informe de ajuste de redes se incluye un mensaje que dice Ajuste Logrado en # iteraciones, donde ## indica el número de iteraciones que se han necesitado para la convergencia de la red.

 Si la diferencia entre los residuales de observaciones calculados es mayor que la tolerancia AA iteraciones finales, las iteraciones de ajuste continúan. Si el ajuste continúa hasta alcanzar el Máximo de iteraciones se utiliza el Límite de convergencia final (véase a continuación).

Límite de convergencia final

Introduzca la tolerancia límite de convergencia para la iteración final del ajuste de la red. El software utiliza este valor para determinar si se ha logrado el ajuste de la red cuando la iteración final no pasa la tolerancia A iteraciones finales.

Si la diferencia calculada en los residuales de observaciones para la última iteración del ajuste es mayor que la tolerancia A iteraciones finales, el residual se compara con el límite de convergencia final y se realiza una de las siguientes acciones:

 Si la diferencia entre los residuales de observaciones calculados es menor que el Límite de convergencia final, se habrá logrado el ajuste y se mostrará el siguiente mensaje ‘Convergencia final lograda tras ## iteraciones (se ha utilizado límite de convergencia final)', donde ## indica el número de iteraciones que se han necesitado para la convergencia de la red.

  Si el residual de observaciones es mayor que el Límite de convergencia final, el ajuste falla y aparecerá el siguiente diálogo aviso El ajuste ha fallado. No hay Convergencia.

Estos mensajes se escriben también en el informe de Ajuste de Redes.

El valor introducido en el campo Máximo de iteraciones determina cuándo ocurre la iteración final. Hay que tener cuidado al efectuar cambios en el número de iteraciones o las tolerancias A iteraciones finales y las tolerancias Límite de convergencia final.


    Escalares sigma

Más Información

 Véase también

Visión de Conjunto

Estas opciones definen los escalares sigma univariadas y bivariadas. Los escalares sigma univariantes se aplican a todos los errores unidimensionales, errores propagados observaciones, componentes de coordenadas, y precisión horizontal.  Los escalares sigma bivariadas se aplican a todas las elipses de errores bidimensionales.

Por defecto, todos los errores propagados se muestran como un error estándar 2-sigma, equiparado a un nivel de confianza del 95%, tanto para los escalares sigma univariadas como para los bivariadas.

Están disponibles las siguientes opciones:

Univariadas

Utilice esta lista para seleccionar el escalar sigma univariante aplicado a todos los errores propagados en observaciones, componentes de coordenadas, y precisión horizontal. Los siguientes son todos errores unidimensionales.

Para el método Esférico y Bomford de EEUU, están disponibles las siguientes opciones:

  1.000 (68%)

  1.646 (90%)

  1.960 (95%)

  2.575 (99%)

Bivariadas

Utilice esta lista para seleccionar el escalar bivariante a todas las elipses de errores. Las elipses de errores son representaciones gráficas de los errores bidimensionales.

Están disponibles las siguientes opciones:

  1.000 (39%)

  2.147 (68%)

  2.447 (95%)

  3.035 (99%)


Diálogo Editar estilo de ajuste - Ficha Presentación de covarianzas
    Diálogo Editar estilo de ajuste − Ficha Presentación de covarianzas

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice esta ficha para definir las opciones bidimensionales y tridimensionales de la presentación de covarianzas para el estilo de ajuste de la red.

Para ver la ficha Presentación de covarianzas del diálogo Editar estilo de ajuste:

1.	Para acceder al diálogo Estilos de ajuste de redes, seleccione Ajuste /  Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo en la lista de estilos.

3.	Haga clic en Editar. Aparecerá el diálogo Editar estilo de ajuste.

4.	Seleccione la ficha Presentación de covarianzas. Aparecerán las opciones de Presentación de covarianzas.

Están disponibles las siguientes opciones:

Horizontal

Utilice estas opciones para definir las opciones de Presentación de covarianzas bidimensional para el estilo de ajuste de redes. Para más  información, véase Horizontal.

Tridimensional

Utilice estas opciones para definir las opciones de Presentación de covarianzas tridimensional para el ajuste. Para más  información, véase Tridimensional.


    Horizontal (Presentación de covarianzas)

Más Información

 Véase también

Visión de Conjunto

Estas opciones definen las opciones de presentación bidimensional de la covarianza para el ajuste:

Expresar precisión como

Utilice esta lista para definir el método de expresar la precisión (P) horizontal (2D) como errores proporcionales. Para la precisión horizontal, distancia es la distancia horizontal entre puntos.

Seleccione una de estas opciones:

  PPM − Seleccione esta opción para expresar la precisión horizontal  en unidades de X partes por millón (donde X = distancia × P × 1.0e-06).

  Razón − Seleccione esta opción para expresar precisión horizontal en unidades de una parte en X (donde X = distancia ÷ P).

  Ninguno − Seleccione esta opción para inhabilitar la presentación de la precisión horizontal.

NOTA: La precisión se calcula usando la siguiente formula:

(E x S)2 = C2 + P2

dónde:

E es el Error Lineal Propagado

S es el escalar en el Error Lineal Propagado

C es término de error constante

P es la Precision

Error lineal propagado

Utilice esta lista para definir el error lineal propagado horizontal (bidimensional) para el estilo de ajuste de redes. El error lineal propagado calculado se fija en 1-sigma, independientemente de los escalares sigma  univariadas y bivariadas.

Seleccione una de estas opciones:

  USA − Seleccione esta opción para utilizar el error estándar de la distancia ajustada, horizontal (2D) o inclinada (3D).

  Canadiense − Seleccione esta opción para utilizar el semieje mayor más largo de la elipse de errores relativos 2D ó 3D.

  Bomford − Seleccione esta opción para utilizar la raíz cuadrada de la suma de las varianzas de errores relativo 2D ó 3D.

  Esférica − Seleccione esta opción para utilizar la media de errores relativos estándar 2D ó 3D.

Término constante

El término constante debe especificarse en las unidades del proyecto definidas en propiedades del proyecto. El rango de este término debe estar entre 0.0 m (0.0 pies USA) y 0.1 m (0.3 pies USA).

Escalar en Error Lineal

Utilice esta lista para definir el escalar horizontal (bidimensional) para escalar la precisión al nivel de confianza deseado. Para escalar matrices de covarianzas relativas se eleva al cuadrado el error lineal propagado.

Para los métodos Esféricos de Bomford, EEUU seleccione una de estas opciones:

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

Para el método Canadiense, seleccione una de las siguientes opciones:

  1.000 (39%)

  2.147 (90%)

  2.447 (95%)

  3.035 (99%)


    Tridimensional (Presentación de covarianzas)

Más Información

 Véase también

Visión de Conjunto

Estas opciones definen las opciones de la presentación tridimensional de la covarianza para el ajuste:

Expresar precisión como

Seleccione el método de expresar la precisión (P) tridimensional (3D) como errores proporcionales. Para la precisión tridimensional, distancia es la distancia inclinada entre puntos.

Seleccione una de estas opciones:

  PPM − Seleccione esta opción para expresar la precisión horizontal  en unidades de X partes por millón (donde X = distancia × P × 1.0e-06).

  Razón − Seleccione esta opción para expresar precisión horizontal en unidades de una parte en X (donde X = distancia ÷ P).

  Ninguno − Seleccione esta opción para inhabilitar la presentación de la precisión horizontal.

NOTA: La precisión es calculada usando la siguiente fórmula:

(E x S)2 = C2 + P2

dónde:

E es el Error Lineal Propagado

S es el escalar del Error Lineal Propagado

C es el término de error constante

P es la Precisión

Error lineal propagado

Utilice esta lista para definir el error lineal propagado tridimensional para el estilo de ajuste de redes. El error lineal propagado calculado se fija en 1-sigma, independientemente de los escalares sigma univariadas y bivariadas.

Seleccione una de estas opciones:

  USA − Seleccione esta opción para utilizar el error estándar de la distancia ajustada, horizontal (2D) o inclinada (3D).

  Canadiense − Seleccione esta opción para utilizar el semieje mayor más largo de la elipse de errores relativos 2D ó 3D.

  Bomford − Seleccione esta opción para utilizar la raíz cuadrada de la suma de las varianzas de errores relativos 2D ó 3D.

  Esférica − Seleccione esta opción para utilizar la media de errores relativos estándar 2D ó 3D..

Término constante

El término constante debe especificarse en las unidades del proyecto definidas en propiedades del proyecto. El rango de este término debe estar entre 0.0 m (0.0 pies USA) y 0.1 m (0.3 pies USA).

Escalar en Error Lineal

Utilice esta lista para definir el escalar tridimensional  para escalar la precisión al nivel de confianza deseado. Para escalar matrices de covarianzas relativas se eleva al cuadrado el error lineal propagado.

Para los métodos Esféricos y de Bomford de los EEUU, seleccione una de estas opciones:

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

Para el método Canadience, seleccione una de estas opciones:

  1.00 (20%)

  2.50 (90%)

  2.80 (95%)

  3.37 (99%)

Utilizar los errores de elevación si están disponibles

Utilice esta casilla de verificación para determinar si al calcular la precisión tridimensional (3D) se han de aplicar errores de elevación disponibles o errores de altura sobre el elipsoide.

Seleccione esta casilla de verificación para calcular la precisión tridimensional utilizando errores de elevación, o borre la marca en esta casilla de verificación para aplicar errores de altura sobre el elipsoide en el cálculo de la precisión tridimensional.

Cuando se selecciona esta casilla de verificación, los errores de elevación sólo se aplican a los cálculos cuando están cargadas las observaciones del geoide, lo que permite calcular elevaciones. Por defecto, esta casilla de verificación está seleccionada. Dejar seleccionada esta casilla de verificación si se tiene confianza en la calidad de los puntos de control vertical fijos y del modelo geoidal seleccionado.

Cuando en las propiedades del proyecto no se selecciona ningún modelo geoidal, en el cálculo de la precisión tridimensional se utilizan los errores de altura sobre el elipsoide y se ignora el estado de selección de esta opción.


Diálogo Editar estilo de ajuste - Ficha Errores de instalación
    Diálogo Editar estilo de ajuste − Ficha Errores de instalación

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice este estilo para definir los errores conocidos de altura de antena, centrado de antena, altura del instrumento, y centrado del instrumento (plomada).  Estas definiciones se aplicarán globalmente a todas las observaciones para compensar los errores al calcular ajustes de redes.

Para ver la ficha Errores de instalación en el diálogo Editar propiedades del ajuste:

1.	Para acceder al diálogo Estilos de ajuste de redes, seleccione Ajuste /  Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo en la lista de estilos.

3.	Haga clic en Editar. Aparecerá el diálogo Editar estilo de ajuste.

4.	Seleccione la ficha Errores de instalación.

En el grupo GPS, están disponibles las siguientes opciones:

Error en altura de antena:

Utilice este campo para definir el error estimado en la altura de la antena. El error estimado se aplica globalmente a todas las observaciones GPS al calcular el ajuste de la red.

El error estimado se basa en el tipo de herramienta de medición y en la capacidad de lectura de las mediciones.  Si se emplea una cinta métrica para medir la altura de la antena, las estimaciones de error admisibles son ligeramente superiores a las de un jalón de medición de altura. Un jalón es una herramienta más rígida para medir alturas, en contraposición a la cinta métrica flexible.

Los errores estimados en la altura de la antena se encuentran típicamente en el rango de 0.000 a 0.004 mm (0.000 a 0.013 pies topos). El valor por defecto es 0.000 m (0.000 pies topos).

Error de centrado

Utilice este campo para definir el error estimado en el centrado mediante plomada y la nivelación de una antena sobre el punto topográfico.

El error estimado se aplica globalmente a todas las observaciones GPS al calcular el ajuste de la red. El error estimado es influenciado por la bondad del mantenimiento de las plataformas niveladoras y la exactitud con que se centren sobre el punto topográfico.

Típicamente, los errores de centrado están en el rango de 0.000 a 0.002 m (0.002 a 0.007 pies topos). El valor por defecto es 0.000 m (0.000 pies topos).

En el grupo Terrestre, las siguientes opciones están disponibles:

Error en la Altura del Instrumento

Utilice este campo para definir el error estimado en la altura del instrumento o en la altura objetivo. El error estimado se aplica globalmente a todas las observaciones terrestres cuando el ajuste de red es calculado.

El error estimado se basa en el tipo de herramienta de medición y en la capacidad de lectura de la medición. Los errores estimados en la altura del instrumento típicamente varían de 0.000 a 0.004 m (0.000 a 0.013 pies topos). El valor por defecto es 0.000 m (0.000 pies topos).

Error de Centrado

Utilice este campo para definir el error estimado en el centrado cuando se ejecuta el plomado y nivelamiento de un instrumento u objetivo sobre los puntos de levantamiento.

El error estimado se aplica globalmente a todas las observaciones terrestres cuando se calcula el ajuste de la red. El error estimado es influenciado a través de qué tan bien están mantenidas las plataformas niveladoras y a través de qué tan bien están centradas sobre los puntos del levantamiento.

Los errores de centrado típicamente varían entre 0.000 y 0.002 m (0.002 to 0.007 pies topos). El valor por defecto es 0.000 m (0.000 pies topos).


    Diálogo Nuevo estilo

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice este diálogo para crear un nuevo estilo de ajuste de redes.

Para ver el diálogo Nuevo estilo:

1.	Para acceder al diálogo Estilos de ajuste de redes, seleccione Ajuste /  Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Haga clic en Nuevo. El  nuevo estilo pasa a ser el estilo activo  y aparecerá el diálogo Nuevo estilo.

Está disponible una opción:

Nombre

Seleccione este campo para inscribir el nombre del nuevo estilo de ajuste de redes. El nombre puede contener hasta 255 caracteres, pero los nombres más cortos son más fáciles de encontrar en la lista de estilos.  Tras asignar un nombre al nuevo estilo haga clic en Aceptar para ver el diálogo Editar estilo de ajuste. Este diálogo sirve para editar los controles del estilo.


    Diálogo Copiar estilo

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice este diálogo para crear un nuevo estilo de ajuste de redes basado en una copia de otro estilo de ajuste de redes.

Para ver el diálogo Copiar estilo:

1.	Para acceder al diálogo Estilos de ajuste de redes, seleccione Ajuste /  Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione en la lista de estilos un estilo existente para copiar.

Haga clic en Copiar.

El estilo copiado pasa a ser el estilo activo y aparecerá el diálogo Copiar estilo.

Está disponible una opción:

Nombre

Seleccione este campo para inscribir el nombre del nuevo estilo de ajuste de redes. Se creará una copia del archivo seleccionado en la lista de estilos utilizando el nuevo nombre. El nombre puede contener hasta 255 caracteres, pero los nombres más cortos son más fáciles de encontrar en la lista de estilos.  Tras asignar un nombre al nuevo estilo haga clic en Aceptar para ver el diálogo Editar estilo de ajuste. Este diálogo sirve para editar los controles del estilo.


    Diálogo Renombrar estilo

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice este diálogo para renombrar un estilo de ajuste de redes.

Para ver el diálogo Renombrar estilo:

1.	Para acceder al diálogo Estilos de ajuste de redes, seleccione Ajuste /  Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes .

2.	Seleccione en la lista de estilos un estilo para renombrar.

Haga clic en Renombrar.

Aparecerá el diálogo Renombrar estilo.

Está disponible una opción:

Nombre

Introduzca en este campo el nuevo nombre para el estilo de ajuste de redes. El nombre puede contener hasta 255 caracteres, pero los nombres más cortos son más fáciles de encontrar en la lista de estilos.


Diálogo Editar Estilo de Ajuste - ficha de Controles Terrestres

Más Información

 Diálogo

Visión de Conjunto

Utilice este estilo de ajuste para definir controles y estimaciones de error terrestre. Estas columnas están disponibles:

Columna	Lo que muestra
Mediciones	Las mediciones terrestres están disponibles. Estas incluyen:   Angulos horizontales   Distancias de pendiente   Angulos verticales   Incrementos de Elevación   Lectura de Barra de Nivel   Separaciones de geoide   Acimutes
Errores estándar por defecto	Los errores estándar que se utilizan cuando no se propoveen errores estándar con la observación.
Errores estándar mínimos absolutos	Los errores estándar mínimo-absolutos. Estos errores se usan cuando son mayores que los errores estándar que se proveen.
Errores estándar mínimos proporcionales	Los errores estándar mínimos proporcionales. Estos errores se usan cuando la suma de la componente de error absoluto y la componente de error proporcional es mayor que los errores estándar que se proveen. NOTA: Los errores proporcionales sólo existen para distancias de pendiente.
Seleccione una de las siguientes casillas de verificación para especificar el tipo de ajuste a llevar a cabo en las observaciones terrestres:

  Lleve a cabo un ajuste vertical

  Lleve a cabo un ajuste horizontal


Añadir observaciones al grupo de transformación

 Visión de Conjunto y Más Información

En todo momento pueden añadirse observaciones a un grupo de transformación definido por el usuario. También pueden quitarse observaciones cuando ya no sean necesarias.

SUGERENCIA: Haga clic en Filtrar para mostrar el diálogo Filtro de observación con opciones para filtrar los tipos de observación en la lista Observaciones disponibles.

SUGERENCIA: También puede mover columnas a nuevas ubicaciones, cambiar el tamaño de las columnas para mostrar más o menos información, y ordenar en orden ascendente o descendente.

Para añadir observaciones:

1.	Seleccione Ajuste/ Grupos de observación/ Grupos de transformación. Aparecerá el diálogo Grupo de Transformación.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

NOTA: No puede editar el grupo de transformación de Geoide por defecto.

3.	Seleccione el Grupo de Transformación.

4.	Haga clic en Editar. Aparecerá el diálogo Editar Grupo de Transformación, que mostrará en la lista Observaciones de grupo las observaciones de grupo seleccionadas.

5.	Seleccione una observación de las que figuran en la lista Observaciones Disponibles.

6.	Haga clic en Añadir. La observación se añade a la lista Observaciones del Grupo.

7.	Haga clic en Aceptar. Los cambios se guardan.


Añadir observaciones a grupo de varianza

 Visión de Conjunto y Más Información

En todo momento pueden añadirse observaciones a un grupo de varianza. También pueden quitarse observaciones cuando ya no sean necesarias.

SUGERENCIA: Haga clic en Filtrar para mostrar el diálogo Filtro de Observación con opciones para filtrar la lista Observaciones disponibles.

SUGERENCIA: También puede mover columnas a nuevas ubicaciones, cambiar el tamaño de las columnas para mostrar más o menos información, y ordenar en orden ascendente o descendente.

Para añadir observaciones:

1.	Seleccione Ajuste/ Grupos de observación/ Grupos de varianza. Aparecerá el diálogo Grupo de Varianza.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

NOTA: No puede editar el grupo de varianzas de Geoide por defecto.

3.	Seleccione el grupo deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar el Grupo de Varianza. La lista Observaciones del grupo muestra las actuales observaciones en el grupo, y la lista Observaciones disponibles muestra todas las observaciones habilitadas en el proyecto.

5.	En la lista Observaciones disponibles, haga clic en la observación que quiera añadir al grupo.

6.	Haga clic en Añadir. La observación se añade a la lista Observaciones del grupo y se quita del grupo Observaciones disponibles.

7.	Haga clic en Aceptar. Los cambios se guardan.


Aplicar estrategias de ponderación

 Visión de Conjunto y Más Información

Las estrategias de ponderación se pueden aplicar a la siguiente iteración de un ajuste.

Para aplicar estrategias de ponderación:

1.	Seleccione Ajuste/ Estrategias de ponderación. Aparecerá el diálogo Estrategias de ponderación.

2.	Seleccione la ficha GPS, la ficha terreste, o la ficha Geoide.

3.	Edite las estrategias de ponderación.

4.	Haga clic en Aplicar. Las nuevas estrategias de ponderación se aplicarán a la siguiente iteración de ajuste.

5.	Haga clic en Aceptar. El diálogo se cierra.


Cambiar el valor de los parámetros de transformación

 Visión de Conjunto y Más Información

CUIDADO: Utilice un cuidado extremo al cambiar los campos de los parámetros de transformación. Antes de intentar estos cambios es necesario tener un pleno conocimiento de la teoría del ajuste de redes y de los ajustes por mínimos cuadrados.

NOTA: Los parámetros Rotación de acimut, Escala de la red, Escala de distancia, y Constante de distancia no se utilizan para las transformaciones de geoide. Estos campos son observaciones terrestres y GPS que se pueden editar.

Para cambiar el valor de un parámetro:

1.	Seleccione Ajuste/ Grupos de observación/ Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS o la ficha Geoide.

3.	Seleccione el grupo deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar grupo de transformación.

5.	Seleccione el campo Valor para el parámetro de transformación deseado.

6.	Introduzca el nuevo valor del parámetro.

Considere estas directrices:

  Los valores angulares se introducen como GGG.MMSSssss, con signo.

  Los valores lineales se introducen en las unidades del proyecto, con signo.

En estos temas pueden encontrarse normas para cambiar el Valor y Estado de los parámetros de transformación individuales:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura

7.	En la lista Estado, seleccione la opción Definido por el usuario. Para más información, seleccione uno de los temas antes mencionados.

8.	Repita los pasos 1 a 7 para cambiar los valores de los parámetros de transformación adicionales, si procede. Tal vez será necesario cambiar los campos Valor y Estado de varios parámetros para crear la transformación deseada.

9.	Haga clic en Aceptar.

Los cambios se aplican al grupo de transformación.


Borrar el estado de fijación de los puntos a fin de quitar las limitaciones de los componentes de las coordenadas

Las configuraciones de estado Fijo utilizadas para limitar puntos individuales a una componente de coordenada en la lista Puntos pueden ser borradas selectivamente.

Para borrar las configuraciones de estado Fijo:

1.	Seleccione Ajuste / Puntos. Aparecerá el diálogo Puntos.

2.	Utilice la barra de desplazamiento para encontrar el punto deseado.

3.	Seleccione el punto.

4.	En el grupo de opciones Fijo, borre las marcas de verificación aplicables a fin de quitar las limitaciones de los componentes.

Haga clic en Aceptar.

Los cambios se aplican al proyecto.


Copiar estilos de ajuste de redes

Los estilos existentes pueden ser copiados para crear un estilo nuevo. Las configuraciones de ajuste de redes definidos para el nuevo estilo serán idénticos a los del estilo original.  Una vez copiado el estilo, las configuraciones podrán personalizarse.

Para copiar un estilo:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Haga clic en Copiar. Aparecerá el diálogo Copiar estilo.

3.	Inscriba en el campo Nombre el nombre del nuevo estilo.

4.	Haga clic en Aceptar. Aparecerá el diálogo Editar estilo de ajuste.

5.	Editar las configuraciones del estilo.

6.	Tras editar el estilo, haga clic en Aceptar. El nuevo estilo se guarda.


Crear estilos de ajuste de redes

Hay dos formas de crear nuevos estilos de ajuste. En este tema se muestra cómo crear nuevos estilos basados en las configuraciones del estilo de ajuste en el ajuste Límites de confianza del 95%. Un segundo tema está disponible para copiar los parámetros de un estilo existente a uno nuevo.

SUGERENCIA: El nuevo estilo se puede editar para afinar las configuraciones de ajuste a fin de adaptarlas a las propias necesidades, lo que permite que esas configuraciones se apliquen a los nuevos estilos conforme éstos se crean.

Para crear un nuevo estilo:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de Ajuste de Redes .

2.	Haga clic en Nuevo. Aparecerá el diálogo Nuevo estilo.

3.	Inscriba en el campo Nombre el nombre del nuevo estilo. Los nombres de estilo pueden tener hasta 255 caracteres, pero los nombres de archivo más cortos son más fáciles de encontrar en la lista de estilos.

4.	Haga clic en Aceptar. Aparecerá el diálogo Editar estilo de ajuste.

5.	Seleccione una de estas fichas:

  General

  Presentación de covarianzas

  Controles Terrestres

  Errores de instalación

6.	Edite los controles de estilo que desee.

7.	Haga clic en Aceptar para guardar el nuevo estilo.


Crear grupos de transformación

 Visión de Conjunto y Más Información

Para un ajuste de redes se pueden crear uno o más grupos de transformación. Una vez creado, el grupo se añade a la lista Grupos.

NOTA: Sólo se pueden crear nuevos grupos de transformación de observaciones GPS. No están permitidos los grupos de transformación de geoide múltiples.

Para crear un nuevo grupo:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS.

3.	Haga clic en Nuevo. Aparecerá el diálogo Nuevo grupo de transformación.

4.	Inscriba en el campo Nombre el nombre del grupo.

5.	Haga clic en Aceptar. Aparecerá el diálogo Editar grupo de transformación con estas opciones.

6.	Añada observaciones de la lista Observaciones disponibles a la lista Observaciones de grupo.

7.	Defina los parámetros de transformación para los grupos.

SUGERENCIA: Puede filtrar la lista para ocultar temporalmente los tipos de observación a fin de acortar la lista. Las listas más pequeñas permiten encontrar más rápidamente las observaciones.

Para filtrar observaciones:

1.	Haga clic en Filtrar. Aparecerá el diálogo Filtro de observación . Inicialmente estarán seleccionadas las casillas de verificación para todos los tipos de observaciones, lo que hace que todas las observaciones estén visibles en la lista Observaciones disponibles.

2.	Borre las marcas de todas las combinaciones de casillas de a fin de ocultar estos tipos de observación.

La acción de filtrado sólo afecta a la sesión de edición actual. Cuando se cierra el diálogo, los filtros se restauran a sus valores originales.

Para añadir una observación:

1.	Seleccione la observación en la lista Observaciones disponibles. Se hace disponible el botón Añadir.

NOTA:  El campo Transformación identifica grupos de transformación ya asociados con las observaciones. Utilice este campo como guía al añadir observaciones. Sólo pueden asignarse observaciones individuales a un grupo de transformación distinto del <Valor por defecto GPS> o <Valor por defecto Terr>. No obstante, las observaciones en un grupo pueden transferirse al grupo activo seleccionándolas y haciendo clic en Añadir. Todas las observaciones GPS permanecen asignadas a < Valor por defecto GPS >, aunque se hayan añadido a otro grupo de transformación. De igual manera, todas las observaciones terrestres permanecen asignadas a <Valor por defecto Terr> incluso cuando son añadidas a otro grupo de transformación.

2.	Haga clic en Añadir.

La observación es añadida a la lista Observaciones del grupo.

Para quitar observaciones:

1.	Seleccione la observación en la lista Observaciones del grupo. El botón Quitar se hace disponible.

2.	Haga clic en Quitar.

La observación se quita de la lista Observaciones del grupo.

NOTA: El estado de las observaciones quitadas cambia en la lista Observaciones Disponibles. El campo Transformación para la observación se borra para permitir que la observación se pueda añadir a otros grupos de transformación.

NOTA: No se pueden quitar observaciones de los grupos de transformación <Valor por defecto GPS>, <Valor por defecto Terr>, o <Valor por defecto Geoide>.

Para definir los parámetros de transformación:

CUIDADO: Utilice un cuidado extremo al cambiar los campos de los parámetros de transformación. Antes de intentar estos cambios es necesario tener un pleno conocimiento de la teoría del ajuste de redes y de los ajustes por mínimos cuadrados. Para obtener una lista de referencias para saber más acerca de la teoría del ajuste de redes y de los ajustes por mínimos cuadrados, véase Bibliografía.

1.	Seleccione el campo Valor para obtener el parámetro deseado.

2.	Edite el campo mediante las normas que se ofrecen en uno de estos temas:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura

NOTA: Los parámetros Rotación de acimut, Escala de la red, Escala de distancia, y Constante de distancia no se utilizan para las transformaciones de geoide.

3.	Seleccione la opción pertinente en la lista Estado. Para más información, véanse los temas antes mencionados.

4.	Para guardar los cambios, haga clic en Aceptar.


Crear grupos de varianza

Se pueden crear nuevos grupos de varianza en cualquier momento entre ajustes.

NOTA: Sólo se pueden crear nuevos grupos de varianza GPS u observaciones terrestres. No están permitidos los grupos de transformación de geoide múltiples.

Para crear grupos de varianza:

1.	Seleccione Ajuste / Grupos de observación / Grupos de varianza. Aparecerá el diálogo Grupos de varianza.

2.	Seleccione la ficha GPS o Terrestre.

3.	Haga clic en Nuevo para crear un grupo de varianza. Aparecerá el diálogo Nuevo grupo de varianza.

4.	Introduzca el nombre del nuevo grupo.

5.	Haga clic en Aceptar. Aparecerá el diálogo Editar el grupo de varianza. La lista Observaciones disponibles se utiliza para seleccionar la observación para añadirla al nuevo grupo.

6.	Seleccione la observación deseada.

SUGERENCIA: Haga clic en Filtrar para mostrar el diálogo de Filtros de Observación con opciones para filtrar los tipos de observación en la lista de Observaciones Disponibles.

7.	Haga clic en Añadir.

8.	Repita los pasos 1 a 7 hasta terminar la creación del grupo.

9.	Haga clic en Aceptar. Los cambios se guardan en el proyecto.


Definir los parámetros de tranformación

 Visión de Conjunto y Más Información

CUIDADO: Utilice un cuidado extremo al cambiar los campos de valor de los parámetros de transformación. Antes de intentar estos cambios es necesario tener un pleno conocimiento de la teoría del ajuste de redes y de los ajustes por mínimos cuadrados.

Para cambiar el valor de un parámetro:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS o la ficha Geoide.

3.	Seleccione el grupo deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar grupo de transformación.

5.	Seleccione el campo Valor para el parámetro de transformación deseado.

6.	Introduzca el valor del nuevo parámetro.

Considere estas normas:

  Los valores angulares se introducen como GGG.MMSSssss, con signo.

  Los valores lineales se introducen en las unidades del proyecto, con signo.

En los siguientes temas se ofrecen normas para cambiar el valor y el estado de los parámetros de transformación individuales:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura

NOTA: Los parámetros Rotación de acimut, Escala de la red, Escala de distancia, y Constante de distancia no se utilizan para las transformaciones de geoide.

7.	Seleccione el parámetro de transformación en la lista Estado. Para más información, véanse los temas antes mencionados.

8.	Repita los pasos 2 a 7 para cambiar los valores de los parámetros de transformación adicionales, si procede.

Tal vez será necesario cambiar los campos Valor y Estado de varios parámetros para crear la transformación deseada.

9.	Haga clic en Aceptar.

Los cambios se aplican al grupo de transformación.


Eliminar grupos de transformación

 Visión de Conjunto y Más Información

Los grupos de transformación definidos por el usuario pueden eliminarse cuando ya no sean necesarios. Una vez eliminado, el grupo se quita del proyecto y ya no está accesible.

NOTA: Los grupos de transformación <Valores por defecto GPS>, <Valores por defecto Terr.> y  <Valores por defecto Geoide> no pueden ser eliminados. Cuando en la lista no figuran otros grupos más que los mencionados por defecto, el botón Eliminar  queda inhabilitado automáticamente.

Para eliminar un grupo:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Haga clic en la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione el grupo.

4.	Haga clic en Eliminar. Aparecerá un mensaje de verificación para confirmar la acción.

5.	Haga clic en Aceptar.


Eliminar grupos de varianza

 Visión de Conjunto y Más Información

Los grupos de varianza pueden eliminarse cuando ya no sean necesarios. Los grupos eliminados se quitan del proyecto y ya no están accesibles.

NOTA: Los grupos de varianza <Valores por defecto GPS>, <Valores por defecto Terr>,  y <Valores por defecto Geoide> no pueden ser eliminados. Cuando en la lista no figuran otros grupos más que los mencionados por defecto, el botón Eliminar  queda inhabilitado automáticamente.

Para eliminar un grupo:

1.	Seleccione Ajuste / Grupos de observación / Grupos de varianza. Aparecerá el diálogo Grupos de varianza.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione grupo deseado.

4.	Haga clic en Eliminar. Aparecerá un mensaje de verificación para confirmar la acción.

5.	Haga clic en Aceptar.


Eliminar estilos de ajuste de redes

Los estilos de ajuste de redes pueden eliminarse cuando ya no sean necesarios. Una vez eliminado, el estilo se quita del proyecto y ya no está accesible.

NOTA: En la lista de estilos debe existir al menos un estilo. Cuando en la lista de estilos sólo existe un estilo se inhabilita automáticamente el botón Eliminar. Si quiere eliminar el último estilo y sustituirlo por otro, haga clic en Nuevo para crear un nuevo estilo. Los estilos nuevos se basan en el estilo de ajuste en el ajuste Límites de confianza del 95%. Para más información, véase Creación de estilos de ajuste de redes.

Para eliminar un estilo:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione el estilo en la lista de estilos.

3.	Haga clic en Eliminar. Aparecerá un mensaje de verificación para confirmar la acción.

4.	Haga clic en Aceptar.


Inhabilitar observaciones de ajustes y recálculos

 Visión de Conjunto y Más Información

Si no quiere usar una observación en un ajuste de red o recálculo, entonces puede inhabilitarla. Cuando se inhabilita una observación, ésta ya no aparece en el diálogo Observaciones pero no se borran permanentemente los datos en el proyecto.

Hay dos maneras de inhabilitar observaciones.

Para inhabilitar observaciones en el diálogo Observaciones:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Seleccione la ficha GPS o Terrestre.

3.	Desplácese a la observación deseada.

SUGERENCIA: Las observaciones en la lista Observaciones Disponibles se pueden filtrar para mostrar u ocultar los tipos de observación seleccionados, lo que facilita la tarea de encontrar las observaciones.

4.	Haga clic en la observación con el botón derecho para acceder al menú de acceso directo y seleccione Inhabilitar. La observación se quita de la lista y ya no se utilizará en futuros ajustes y recálculos.

La observación se resalta en rojo dentro de Vista del levantamiento para denotar su estado de inhabilitación.

5.	Haga clic en Aceptar para guardar los cambios en el proyecto.

Para inhabilitar observaciones en la ventana Gráficos:

1.	Haga doble clic en la observación. La ventana Propiedades aparecerá.

2.	Haga clic en el botón del menú [image] en la página de resumen. Aparecerá la página Resumen.

3.	Haga clic en la lista Estado y seleccione Inhabilitar.

Si desea rehabilitar observaciones inhabilitadas, debe editar las propiedades de observación en la ventana de gráficos.

NOTA: Inhabilitar una observación y excluir una observación son dos operaciones diferentes. Como en el caso de las observaciones inhabilitadas, las observaciones excluidas no son usadas para ajustes de red o recálculos. Sin embargo, éstas siguen apareciendo en la lista de Observaciones. Los datos de observación no quedan permanentemente eliminados del proyecto, por lo que puede utilizar una observación previamente excluida nuevamente.


Editar las opciones del estilo de ajuste presentación de covarianza

 Visión de Conjunto y Más Información

Las configuraciones de Presentación de covarianzas se pueden editar en cualquier momento entre ajustes.

Para editar las configuraciones de Presentación de covarianzas:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo en la lista de estilos.

3.	Haga clic en Editar. Aparecerá el diálogo Editar estilos de ajuste.

4.	En la ficha Estilo de Covarianza, edite las siguientes opciones según sea necesario:

  Horizontal

  Tridimensional

5.	Tras editar las opciones, haga clic en Aceptar. Los cambios se aplican al estilo de ajuste.


Editar el estilo de ajuste General
Editar las opciones de estilo de ajuste general

Las configuraciones de General se pueden editar en cualquier momento entre ajustes.

Para editar las configuraciones de General:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo en la lista de estilos.

3.	Haga clic en Editar. Aparecerá el diálogo Editar estilos de ajuste.

4.	Seleccione la ficha General, seleccione o borre las siguientes casillas de verificación:

  Usar perfil de columna reducido.

  Restringir términos de covarianza a líneas observadas.

  Calcular correlaciones para el modelo geoidal

5.	Editar las opciones de Tolerancias de residuales.

6.	Editar las opciones de Escalares sigma.

7.	Introduzca un nuevo valor en el campo Máximo de iteraciones.

8.	Haga clic en Aceptar para guardar los cambios.


Editar opciones de estilo de control terrestre

 Visión de Conjunto y Más Información

Se pueden editar las opciones de Control Terrestre en cualquier momento cuando se esté entre ajustes.

Para hacerlo:

1.	Seleccione Ajuste / Estilos de Ajuste. Aparece el diálogo de Estilos de Ajuste de Red.

2.	Seleccione un estilo de la lista de estilos.

3.	Haga clic en Editar. Aparece el diálogo de Editar Estilos de Ajuste.

4.	En la ficha de Control Terrestre, proceda a editar los valores de error estándar para las mediciones relevantes.

5.	Seleccione o deje en blanco la casilla de verificación de Ejecutar Ajuste Vertical. Esta opción se selecciona cuando está ajustando la poligonal 3D o cuando está ajustando los datos de nivel.

6.	Seleccione o deje en blanco la casilla de verificación de Ejecutar Ajuste Horizontal. Esta opción se selecciona cuando está ajustando una poligonal 2D.

7.	Haga clic en Aceptar para guardar los cambios.


Editar grupos de transformación

 Visión de Conjunto y Más Información

Cuando se edita un grupo de transformación GPS se pueden realizar diversas operaciones entre las que se incluyen las de añadir observaciones al grupo, quitarlas del grupo y definir los parámetros de transformación. La edición del grupo de transformación del geoide se limita a la definición de los parámetros de transformación.

Para editar el grupo de transformación GPS, terrestre, o de geoide:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione el grupo de transformación.

4.	Haga clic en Editar. Aparecerá el diálogo Editar grupos de transformación.

5.	Añadir o quitar observaciones (véase a continuación) (sólo GPS o terrestre)

6.	Definir los parámetros de transformación (véase a continuación) (GPS, terrestre, o geoide).

Para filtrar observaciones en un grupo de transformación GPS:

1.	Haga clic en Filtrar. Aparecerá el diálogo Filtro de observación. Inicialmente, las casillas de verificación para todos los tipos de observación están seleccionadas, lo que hace que todas las observaciones estén visibles en la lista Observaciones Disponibles.

2.	Borre las marcas de todas las combinaciones de casillas a fin de ocultar los tipos de observación. La acción de filtrado sólo afecta a la sesión de edición actual. Cuando se cierra el diálogo los filtros se restauran a sus valores originales.

Para añadir una observación GPS:

1.	Seleccione la observación en la lista Observaciones disponibles. Se resalta la observación y se hace disponible el botón Añadir.

NOTA: El campo Transformación de la lista Observaciones disponibles identifica grupos de transformación ya asociados con observaciones. Utilice este campo como guía al añadir observaciones. Las observaciones individuales sólo pueden asignarse a un grupo de transformación.

2.	Haga clic en Añadir.

La observación se añade a la lista Grupo de Observaciones.

Para quitar observaciones GPS o terrestres de un grupo de transformación:

1.	Seleccione la observación en la lista Grupo de observaciones. Se resalta la observación y se hace disponible el botón Quitar.

2.	Haga clic en Quitar. La observación se quita de la lista Grupo de observaciones.

NOTA: No se pueden quitar observaciones de los grupos de transformación <Valor por defecto GPS>, <Valor por defecto Terr.>,  o <Valor por defecto Geoide>.

NOTA: El estado de las observaciones quitadas cambia en la lista Observaciones disponibles. El campo Transformación para la observación se borra para permitir que la observación se pueda añadir a otros grupos de transformación.

Para definir los parámetros de transformación para un grupo de transformación GPS, terrestre, o geoide:

CUIDADO: Utilice un cuidado extremo al cambiar el valor o estado de un parámetro de transformación. Antes de intentar estos cambios es necesario tener un pleno conocimiento de la teoría del ajuste de redes y de los ajustes por mínimos cuadrados. Para obtener una lista de referencias para saber más acerca de la teoría del ajuste de redes y de los ajustes por mínimos cuadrados, véase Bibliografía.

1.	Seleccione el campo Valor para el parámetro deseado.

2.	Edite el campo utilizando las normas que figuran en uno de estos temas:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura

NOTA: Los parámetros Rotación de acimut, Escala de la red, Escala de distancia, y Constante de distancia no se utilizan para las transformaciones de geoide.

3.	Seleccione la opción pertinente en la lista Estado. Para más información, véanse los temas antes mencionados.

4.	Haga clic en Aceptar para guardar los cambios en el proyecto.


Editar Grupos de varianza

 Visión de Conjunto y Más Información

Los grupos de varianza se pueden editar entre ajustes.

NOTA: El botón Editar para el grupo de transformación de geoide por defecto sólo permite ver el grupo.

Para editar un grupo:

1.	Seleccione Ajuste / Grupos de observación / Grupos de varianza. Aparecerá el diálogo Grupos de varianza.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione el grupo deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar grupo de varianza. La lista Observaciones del grupo muestra las observaciones en el grupo, y la lista Observaciones disponibles muestra todas las observaciones de ajuste de redes habilitadas.

Para añadir observaciones:

1.	Seleccione una observación en la lista Observaciones disponibles. La observación se resalta y el botón Añadir se hace disponible.

2.	Haga clic en Añadir.

La observación se añade a la lista Observaciones del grupo y se quita de la lista Observaciones disponibles.

Para quitar observaciones:

1.	Seleccione la observación en la lista Observaciones del grupo. La observación se resalta y el botón Quitar se hace disponible.

2.	Haga clic en Quitar.

La observación se quita del grupo y se coloca en la lista Observaciones disponibles.

Para guardar observaciones:

  Haga clic en Aceptar.

Los cambios se guardan en el proyecto.


Editar campo de puntos de observación
Editar coordenadas en la lista de puntos

 Visión de Conjunto y Más Información

Las coordenadas de un punto en la lista Puntos se pueden editar entre ajustes.

1.	Seleccione Ajuste / Puntos. Aparecerá el diálogo Puntos.

2.	Utilice la barra de desplazamiento para encontrar el punto a editar.

3.	Seleccione la componente de coordenada a editar.

4.	Cuando se edita una componente de coordenada, la casilla de verificación para la componente (en el grupo Fijo) es automáticamente seleccionada.

5.	Cuando se inhabilita una componente en el grupo Fijo, la componente de coordenada vuelve a quedar con el valor con el cual fue almacenada en el campo antes del proceso de edición.

6.	Para editar más puntos, repita los pasos anteriores.

7.	Tras completar la sesión de edición, haga clic en Aceptar.

Los cambios se guardan en el proyecto en la vista que fue seleccionada (esto es, WGS-84, cuadrícula o local).


Editar estrategias de ponderación

 Visión de Conjunto y Más Información

Las estrategias de ponderación pueden ser definidas y aplicadas entre ajustes.

Para editar estrategias de ponderación:

1.	Seleccione Ajuste / Estrategias de ponderación. Aparecerá el diálogo Ponderación escalar.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide. Aparecerá la lista Observaciones GPS, la lista Geoide, o la lista de Observaciones del geoide.

3.	Configure la opción Aplicar escalares a Todas las observaciones, Cada observación, o Grupos de Varianza.

NOTA: Todas las observaciones es la única opción disponible para el grupo transformación de geoide.

4.	Realice una de estas acciones:

  Si en el paso previo seleccionó Todas las observaciones o Cada observación, salte al paso 6.

  Si seleccionó Grupos de varianza, realice el paso 5.

NOTA: Si se seleccionó el botón Cada observación, no estará disponible el tipo Escalar definido por el usuario.

5.	Si en el paso 3 seleccionó Grupos de varianza, la lista Observaciones es sustituida por la lista Grupos y se muestran todos los grupos de varianza. Realice estos pasos:

a.	Configure Tipo de escalar como Por defecto, Alternativo, Definido por el usuario, o Automático.

b.	Realice una de estas acciones:

  Si seleccionó Por defecto, Alternativo, o Automático, salte al paso 8.

  Si seleccionó Definido por el usuario, el cursor aparecerá en el campo Escalar de la lista Grupos, y podrá introducir un valor escalar.

c.	Tras introducir un valor escalar, proceda al paso 8.

6.	Configure el Tipo de escalar como Por defecto, Alternativo, o Definido por el usuario, o Automático.

7.	Realice una de estas acciones:

  Si seleccionó Por defecto, Alternativo, o Automático salte al paso 8.

  Si seleccionó Definido por el usuario se hace disponible el campo Valor de escalar, el cual le permitirá introducir un valor de escalar. Introduzca el valor y realice el paso siguiente.

8.	Haga clic en Aceptar o Aplicar.

Los cambios se guardan.


Editar las opciones del estilo de ajuste errores de instalación

 Visión de Conjunto y Más Información

Las opciones de Errores de instalación pueden editarse en cualquier momento entre ajustes.

Para editar las opciones de Errores de instalación:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione un estilo de la lista de estilos.

3.	Haga clic en Editar. Aparecerá el diálogo Editar estilos de ajuste.

4.	Seleccione la ficha Errores de instalación. Aparecerán las opciones de Errores de instalación . Si es necesario, realice estas acciones:

a.	Introduzca un nuevo valor en el campo Error en Altura de antena o Error en la Altura del Instrumento de terreno.

b.	Introduzca nuevos valores en el campo Error de Centrado.

5.	Tras completar los cambios, haga clic en Aceptar.

Los cambios se guardan.


Incluir Observaciones en un ajuste

 Visión de Conjunto y Más Información

Observaciones previamente excluidas de los ajustes de las redes pueden incluirse de nuevo.

Para incluir observaciones:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide. Aparecerá la lista Observaciones.

3.	Utilice la barra de desplazamiento para encontrar las observaciones.

4.   Seleccione las casillas de verificación en Usar columna para incluir observaciones en el ajuste de las redes.

CONSEJO: Puede usar la tecla Mayusc. o Control para seleccionar observaciones múltiples.

5.	Haga clic en Aceptar.

Los cambios se guardan en el proyecto.

NOTA: Para más información acerca de la exclusión de observaciones para un ajuste, véase Exclusión de Ajustes.

NOTA: Las observaciones también pueden ser inhabilitadas y rehabilitadas. Para más información, véase Inhabilitar observaciones y Rehabilitar observaciones inhabilitadas.

NOTA: También puede usar la ventana de Propiedades para incluir observaciones en el ajuste. Para hacer esto, seleccione la casilla de Usar ajuste de red en la página de Resumen.


Evaluar Informes de ajustes
Evaluar Informes de Ajustes de Redes

 Visión de Conjunto y Más Información

Conforme se realizan ajustes sucesivos, los resultados se ven en el informe Ajuste de redes. Basándose en las evaluaciones de los resultados incluidos en el informe, se realizan acciones para llevar progresivamente a la red hacia la convergencia. Estas acciones pueden requerir que se realicen cambios en los estilos de ajuste, incluyendo o excluyendo observaciones, habilitando o inhabilitando observaciones, cargando separaciones de geoide, creando grupos de transformación para aplicar transformaciones a grupos de observaciones, creando grupos de varianza, aplicando estrategias de ponderación, limitando los puntos de control a los componentes de las coordenadas, y otras acciones.

Para evaluar un informe:

1.	Seleccione Informes / Informe de ajuste de redes. Se genera el informe y se inicia el visor HTML por defecto para su computadora, lo que le permite ver el informe utilizando el visor.

2.	Navegue por el informe para ver las estadísticas seleccionadas y evaluar los resultados.

Los temas siguientes proporcionan las normas generales para evaluar las estadísticas del informe: Para una información más avanzada, consúltese la Bibliografía.

Las normas para la evaluación de las secciones del informe están incluidas en estos temas:

  Configuraciones de Estilos de Ajuste

  Tolerancias Residuales

  Mostrar Covarianza

  Controles Terrestres

  Errores de Instalación

  Resumen Estadístico

  Número de iteraciones

  Estadísticas globales

  Estadísticas de observaciones GPS

  Estadísticas del modelo geoidal

  Estadísticas para las Observaciones Terrestres

  Estrategias de Ponderación

  Coordenadas Ajustadas

  Coordenadas de Cuadrícula

  Coordenadas Geodésicas

  Deltas de Coordenadas

  Comparaciones de Coordenadas de Control

  Observaciones Ajustadas

  Observaciones GPS

  Observaciones de Geoide

  Observaciones Terrestres

  Histogramas para Residuales Estandarizados

  Elipses de Error de Punto

  Valores de Covarianza


Filtrar observaciones

 Visión de Conjunto y Más Información

El filtrado resulta útil cuando se examinan grandes cantidades de tipos de observaciones GPS. Se pueden filtrar temporalmente las observaciones mientras está abierto el diálogo. La acción de filtrado oculta efectivamente los tipos de observaciones seleccionados, haciendo que la lista aparezca más pequeña. Cuando se filtra la lista Observaciones aparece en el título del diálogo la palabra ‘Filtrada’. Al salir del diálogo se liberan las observaciones filtradas.

Para filtrar observaciones:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Seleccione la ficha GPS o Terrestre. Aparecerá la lista Observaciones.

3.	Haga clic en Filtrar. Aparecerá el diálogo Filtro de observaciones.

4.	Seleccione las casillas de verificación deseadas. Por defecto todas las casillas de verificación para filtrar son seleccionadas.

En el filtro de observaciones terrestres, deje sin seleccionar todas las observaciones a menos que esté seguro de los tipos de observación que desea seleccionar. Si selecciona una opción, esta es la misma que como si se seleccionara una observación parcial. Por ejemplo, si selecciona un filtro de distancia del elipsoide, entonces verá observaciones que contienen una distancia de elipsoide. No obtendrá observaciones con un ángulo horizontal y distancia de elipsoide a menos que seleccione ambas opciones de filtro.

  Si selecciona la casilla de verificación de Acimut y deja en blanco las casillas de verificación para el resto de las observaciones, sólo serán mostradas las observaciones con acimutes que han sido tecleados.

  Si selecciona la casilla de verificación de elevación Delta y deja en blanco las casillas de verificación para el resto de las observaciones, los datos de nivel serán seleccionados.

  Si desea ver observaciones brutas; seleccione las casillas de verificación de ángulo horizontal, distancia del elipsoide, y elevación trigonométrica.

5.	Haga clic en Aceptar. Los tipos de observaciones seleccionados están ocultos a la vista, pero siguen utilizándose en el ajuste de redes.


Filtrar observaciones de ponderación escalar

 Visión de Conjunto y Más Información

El filtrado resulta útil cuando se examinan grandes cantidades de diversas observaciones GPS u observaciones terrestres. Se pueden filtrar temporalmente las observaciones mientras está abierto el diálogo. La acción de filtrado oculta efectivamente los tipos de observaciones seleccionados, haciendo que la lista aparezca más pequeña. Cuando se filtra la lista Observaciones aparece en el título del diálogo la palabra ‘Filtrada’. Al salir del diálogo se liberan las observaciones filtradas.

Para filtrar observaciones:

1.	Seleccione Ajuste / Estrategias de ponderación. Aparecerá el diálogo Estrategias de ponderación.

2.	Seleccione la ficha GPS. Aparecerá la lista Observaciones.

3.	Haga clic en Filtrar. Aparecerá el diálogo Filtro de observaciones. Por defecto, todas las casillas de verificación de filtro están seleccionadas.

4.	Seleccione las casillas de verificación deseadas para filtrar la lista Observaciones Disponibles. La selección de una casilla de verificación borra su marca. Si se borran todas las marcas de verificación se ocultan todas las observaciones.

En el filtro de observaciones terrestres, deje seleccionadas todas las observaciones a menos que esté seguro de todos los tipos de observaciones que desea seleccionar. Si se selecciona una opción, ésto es lo mismo que si seleccionaran observaciones parciales. Por ejemplo, si selecciona el filtro de distancia del elipsoide, entonces sólo verá observaciones que contienen un elipsoide de distancia. No obtendrá observaciones con un ángulo horizontal y distancia del elipsoide a menos que seleccione ambas opciones de filtrado.

  Si selecciona la casilla de verifiación de Acimut y borra las casillas de verificación para otras observaciones, entonces sólo se mostraran observaciones con acimutes directamente tecleados.

  Si selecciona la casilla de verifiación de elevación Delta y borra las casillas de verifiación para el resto de las observaciones, entonces se seleccionarán los datos de nivel.

  Si quiere ver observaciones brutas; seleccione las casillas de verifiación de ángulo horizontal, distancia del elipsoide, y elevación trigonométrica.

5.	Haga clic en Aceptar. Los tipos de observaciones seleccionados están ocultos a la vista, pero siguen utilizándose en el ajuste de redes.


Filtrar observaciones de grupo de transformación

 Visión de Conjunto y Más Información

El filtrado resulta útil cuando se examinan grandes cantidades de diversas observaciones GPS u observaciones terrestres. Se pueden filtrar temporalmente las observaciones mientras está abierto el diálogo. La acción de filtrado oculta efectivamente los tipos de observaciones seleccionados, haciendo que la lista aparezca más pequeña. Cuando se filtra la lista Observaciones aparece en el título del diálogo la palabra ‘Filtrada’. Al salir del diálogo se liberan las observaciones filtradas.

Para filtrar observaciones:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS. Aparecerá la lista Observaciones disponibles.

3.	Haga clic en Filtrar. Aparecerá el diálogo Filtro de observaciones. Por defecto, todas las casillas de verificación de filtro están seleccionadas.

4.	Seleccione las casillas de verificación deseadas para filtrar la lista Observaciones disponibles. La selección de una casilla de verificación borra su marca. Si se borran todas las marcas de verificación se ocultan todas las observaciones.

En el filtro de observaciones terrestres, deje seleccionadas todas las observaciones a menos que esté seguro de todos los tipos de observaciones que desea seleccionar. Si seleccionar una opción, ésto es lo mismo que si seleccionaran observaciones parciales. Por ejemplo, si selecciona el filtro de distancia del elipsoide, entonces sólo verá observaciones que contienen un elipsoide de distancia. No obtendrá observaciones con un ángulo horizontal y distancia del elipsoide a menos que seleccione ambas opciones de filtrado.

  Si selecciona la casilla de verifiación de Acimut y borra las casillas de verificación para otras observaciones, entonces sólo se mostraran observaciones con acimutes directamente tecleados.

  Si selecciona la casilla de verifiación de elevación Delta y borra las casillas de verifiación para el resto de las observaciones, entonces se seleccionarán los datos de nivel.

  Si quiere ver observaciones brutas; seleccione las casillas de verifiación de ángulo horizontal, distancia del elipsoide, y elevación trigonométrica.

5.	Haga clic en Aceptar.

Los tipos de observaciones seleccionados están ocultos a la vista, pero siguen utilizándose en el ajuste de redes.


Filtrar observaciones del grupo de varianza

 Visión de Conjunto y Más Información

El filtrado resulta útil cuando se examinan grandes cantidades de diversas observaciones GPS. Se pueden filtrar temporalmente las observaciones mientras está abierto el diálogo. La acción de filtrado oculta efectivamente los tipos de observaciones seleccionados, haciendo que la lista aparezca más pequeña. Cuando se filtra la lista Observaciones aparece en el título del diálogo la palabra ‘Filtrada’. Al salir del diálogo se liberan las observaciones filtradas.

Para filtrar observaciones:

1.	Seleccione Ajuste / Grupos de observación / Grupos de varianza. Aparecerá el diálogo Grupos de varianza.

2.	Seleccione la ficha GPS o la ficha Terrestre. Aparecerá lista Observaciones disponibles.

3.	Haga clic en Filtrar. Aparecerá el diálogo Filtro de observaciones. Por defecto, todas las casillas de verificación de filtro están seleccionadas.

4.	Seleccione las casillas de verificación deseadas para filtrar la lista Observaciones Disponibles. La selección de una casilla de verificación borra su marca. Si se borran todas las marcas de verificación se ocultan todas las observaciones.

En el filtro de observaciones terrestres, deje seleccionadas todas las observaciones a menos que esté seguro de todos los tipos de observaciones que desea seleccionar. Si selecciona una opción, ésto es la mismo que si seleccionaran observaciones parciales. Por ejemplo, si selecciona el filtro de distancia del elipsoide, entonces sólo verá observaciones que contienen un elipsoide de distancia. No obtendrá observaciones con un ángulo horizontal y distancia del elipsoide a menos que seleccione ambas opciones de filtrado.

  Si selecciona la casilla de verifiación de Acimut y borra las casillas de verificación para otras observaciones, entonces sólo se mostraran observaciones con acimutes directamente tecleados.

  Si selecciona la casilla de verifiación de elevación Delta y borra las casillas de verifiación para el resto de las observaciones, entonces se seleccionarán los datos de nivel.

  Si quiere ver observaciones brutas; seleccione las casillas de verifiación de ángulo horizontal, distancia del elipsoide, y elevación trigonométrica.

5.	Haga clic en Aceptar.

Los tipos de observaciones seleccionados están ocultos a la vista, pero siguen utilizándose en el ajuste de redes.


Cargar separaciones de geoide

 Visión de Conjunto y Más Información

Para poder calcular las elevaciones de los puntos hay que asignar al proyecto un modelo geoidal y deben cargarse en el proyecto las separaciones de geoide.

Típicamente, las separaciones de geoide se cargan después de producir coordenadas en cada punto usando un ajuste totalmente limitado que usa el datum para el cual el modelo geoidal está definido.

NOTA: Este archivo de ayuda emplea el término observaciones de geoide para describir las separaciones de geoide utilizadas en los ajustes de redes. Las observaciones de geoide se cargan en el proyecto, pero sólo se usan para los ajustes.

Para cargar las separaciones de geoide:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Seleccione la ficha Geoide.

3.	Realice una de estas acciones:

  Si se hubieran cargado previamente separaciones de geoide, las observaciones se mostrarán en la lista Observaciones, y se podrá detener aquí este procedimiento.

  Si la lista Observaciones está vacía, las separaciones de geoide no están cargadas en el proyecto, y habrá que completar este procedimiento.

4.	Haga clic en Cargar. Las separaciones de geoide para todos los puntos correspondientes se cargan en el proyecto y se muestran en la lista Observaciones.

NOTA: El botón de Cargar está inhabilitado si el modelo geoidal no está definido para el proyecto.

NOTA: Las observaciones de Geoide se interpolan en la posición actual del punto. Si las posiciones de los puntos han cambiado significativamente, entonces debe volver a cargar las observaciones de geoide.

5.	Haga clic en Aceptar.

Los cambios se guardan.


Mover columnas de lista

 Visión de Conjunto y Más Información

Las columnas de la lista Observaciones pueden moverse a nuevas ubicaciones en la lista.

Para mover columnas:

1.	En cualquier lista de observaciones, mueva el cursor sobre la cabecera de la columna. La cabecera contiene el título de la columna y está situada por encima de la primera fila de datos.

2.	Realice una de estas acciones:

  Para mover la columna a la derecha, arrastre la cabecera de la columna hacia la derecha hasta que su lado izquierdo sobrepase la posición en la que desee insertar la columna, luego suelte el botón del ratón.

  Para mover la columna a la izquierda, arrastre la cabecera de la columna hacia la izquierda hasta que su lado derecho sobrepase la posición en la que desee insertar la columna, luego suelte el botón del ratón.


Navegar por el informe Ajuste de Redes

 Visión de Conjunto y Más Información

Una vez que vea un informe en el visor HTML por defecto en su computadora, utilice los comandos en el visor para navegar por el informe.

Siga estas normas:

  Utilícense los hipervínculos en el Indice de materias en la cabecera del informe para desplazarse a secciones individuales del informe.

  Utilice el comando en el visor HTML para volver a la parte superior de una página o a un hipervínculo anterior a fin de retornar al Indice de materias.. La mayoría de los visores disponen de un botón Retorno para estos fines.

  Utilice las teclas Re pág y Av pág o las barras de desplazamiento para navegar a las secciones del informe.

  Pulse Alt+Tab para desplazarse atrás y adelante entre el software Trimble Geomatics Office y el visor HTML.


Quitar valores ajustados

 Visión de Conjunto y Más Información

Utilice este comando para dejar la red con la misma configuración que se tenía previamente a iniciar el ajuste.

Para quitar valores ajustados, seleccione Ajuste / Quitar valores ajustados.

Al usar este comando:

  el datum se configura a WGS-84

  no hay puntos con estado fijo

  se quitan las elipses de error

  se descargan las observaciones de geoide

  se vuelve a aplicar la calibración si una calibración estaba presente antes del ajuste de la red.

  se quitan las coordenadas Ajustadas

NOTA: No se reestablecen las observaciones que fueron habilitadas para ser ajustadas.


Quitar las coordenadas de calibración

 Visión de Conjunto y Más Información

Las coordenadas de calibración guardadas en el proyecto tras un ajuste mínimamente limitado pueden quitarse.

Para quitar las coordenadas de calibración, seleccione Ajuste / Coordenadas de calibración / Quitar.

Las coordenadas de calibración se quitan del proyecto.


Quitar observaciones de grupos de transformación

 Visión de Conjunto y Más Información

Se pueden quitar observaciones de grupos de transformación GPS o terrestres que han sido creados por el usuario.

NOTA: No se pueden quitar observaciones del grupo de transformación <Valor por defecto de geoide>.

Para quitar observaciones de un grupo de transformación GPS.

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS o la ficha Terrestre.

3.	Seleccione un grupo.

4.	Haga clic en Editar. Aparecerá el diálogo Editar grupos de transformación.

5.	En la lista Grupo de observaciones, seleccione la observación deseada. El botón Quitar se hace disponible.

6.   Haga clic en Quitar. La observación se quita del grupo y aparece en la lista Observaciones disponibles.

7.	Haga clic en Aceptar.

Los cambios se guardan en el proyecto.


Quitar observaciones de grupos de varianza

 Visión de Conjunto y Más Información

Se pueden quitar observaciones de grupos de varianza GPS o terrestres.

NOTA: No se pueden quitar observaciones del grupo de varianza <Valor por defecto de geoide>.

Para quitar observaciones:

1.	Seleccione Ajuste / Grupos de observación / Grupos de varianza. Aparecerá el diálogo Grupos de varianza.

2.	Seleccione la ficha GPS o terrestre.

3.	Seleccione grupo deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar grupos de varianza.

5.	Seleccione la observación deseada en Observaciones de grupo. La observación se resalta y el botón Quitar se hace disponible.

6.	Haga clic en Quitar. La observación se quita del grupo y se incluye en la lista Observaciones disponibles.

SUGERENCIA: La lista Observaciones disponibles se puede filtrar. La acción de filtrado oculta los tipos de observación seleccionados haciendo la lista efectivamente más pequeña. Al aparecer menos observaciones en la lista, éstas se pueden encontrar más rápidamente.

7.	Haga clic en Aceptar para aplicar los cambios.


Renombrar los estilos de ajuste de redes

 Visión de Conjunto y Más Información

Los estilos de ajuste se pueden renombrar en cualquier momento entre ajustes.

Para renombrar un estilo:

1.	Seleccione Ajuste / Estilos de ajuste. Aparecerá el diálogo Estilos de ajuste de redes.

2.	Seleccione el estilo deseado en la lista de estilos.

3.	Haga clic en Renombrar. Aparecerá el diálogo Renombrar estilo.

4.	Inscriba en el campo Nombre el nombre del nuevo estilo.

5.	Haga clic en Aceptar.

Los cambios se guardan y se vuelve al diálogo Estilos de ajuste de redes.


Cambiar el tamaño de las columnas de una lista

 Visión de Conjunto y Más Información

El tamaño de las columnas de la lista Observaciones se puede cambiar para mostrar u ocultar información.

Para cambiar el tamaño de las columnas:

1.	Mueva el cursor al lado derecho de la cabecera de la columna deseada hasta que aparezca un cursor para el cambio de tamaño.

La cabecera contiene el título de la columna y está situada por encima de la primera fila de datos.

2.	Arrastre la cabecera de la columna a la izquierda o a la derecha hasta obtener la anchura deseada. La anchura de la columna aumenta o disminuye conforme se mueve la cabecera.

La columna habrá cambiado así su tamaño.


Guardar las coordenadas de calibración

 Visión de Conjunto y Más Información

Tras completar un ajuste mínimamente limitado con datos GPS sobre un datum WGS-84 y establecer las coordenadas WGS-84 de cada uno de los puntos en el ajuste de una red, estas coordenadas pueden ser utilizadas como coordenadas GPS observadas para la calibración de un emplazamiento.

Las coordenadas de calibración consisten en latitudes y longitudes WGS-84, y Alturas de Elipsoide.

NOTA: Este comando sólo está disponible cuando se selecciona el WGS-84 como datum para el ajuste, y el ajuste se a llevado a cabo usando sólo datos GPS.

Para guardar las coordenadas de calibración:

1.	Seleccione Ajuste / Coordenadas de calibración / Guardar. Aparecerá el diálogo Guardar coordenadas de calibración.

2.	Seleccione la opción Crear Coordenadas Bajo Puntos Existentes o la opción Crear Coordenadas Bajo Nuevos Puntos con Sufijo.

3.	Haga clic en Aceptar.

Las coordenadas de calibración se guardan y se pueden ver en las ventana de Propiedades.


Seleccionar el datum para un ajuste

 Visión de Conjunto y Más Información

Durante un proyecto se puede configurar la definición del datum para los resultados del ajuste. Esta configuración no afecta al datum del proyecto configurado en el diálogo Propiedades Proyecto. Durante un ajuste GPS mínimamente limitado se puede, típicamente, configurar el datum como WGS-84. Antes de llevar a cabo un ajuste mínimamente limitado de datos terrestres, puede configurar el datum al datum del Proyecto. Una vez que esté preparado para un ajuste totalmente limitado se configurará el datum como datum del proyecto.

1.	Para ver el submenú Datum, seleccione Ajuste / Datum. Aparecerá un menú con estas opciones:

  WGS-84

  Datum del proyecto - <nombre del datum >

2.	Seleccione el datum.


Configurar el estado Fijar para limitar los puntos a una componente de coordenada
Configurar el estado Fijar para limitar las coordenadas

Las configuraciones de Fijar sirven para limitar las componentes de las coordenadas de los puntos incluidos en el ajuste de red.

NOTA: Cuando se fija la componente de las coordenadas de un punto (2D, Altura, Elev) en el diálogo de Puntos, se genera una coordenada ajustada. Puede ver las coordenadas ajustadas en la ventana de Propiedades.

Para definir las configuraciones de Fijar:

1.	Seleccione Ajuste / Puntos. Aparecerá el diálogo Puntos.

2.	Utilice la barra de desplazamiento para encontrar el punto deseado y luego seleccione el punto.

3.	Cuando edite una componente de coordenada, la componente se fija automáticamente en la opción del grupo Fijar.

NOTA: Puede identificar los puntos que ya tienen coordenadas de control introducidas por (NE, e, h) en la columna fija. El paréntisis indica que el punto no ha sido fijado todavía.

NOTA: Si borra una componente de coordenada que ya ha sido fijada, las componentes de coordenadas vuelven al antiguo valor de coordenada (ej. Retorna al valor del diálogo previamente a la edición.)

NOTA: En cualquier momento se pueden borrar las configuraciones de Fijo para liberar las limitaciones de las coordenadas asignadas al punto.

4.	Haga clic en Aceptar.

Los cambios se guardan en el proyecto.


Ordenar las columnas de listas

 Visión de Conjunto y Más Información

La lista Observaciones o la lista Puntos pueden ordenarse en orden ascendente o descendente.

Inicialmente, la lista Observaciones se ordena mostrando los residuales en la parte superior de la lista. La lista de Puntos se ordena por puntos fijos primero. Se puede hacer clic en la cabecera de cualquier columna para ordenar la lista en orden descendente o ascendente basado en el contenido de la columna.

Para ordenar una columna:

1.	Mueva el cursor sobre la cabecera de la columna. La cabecera contiene el título de la columna y está situada por encima de la primera fila de datos.

2.	Para ordenar la columna en orden ascendente, haga clic una vez en el botón izquierdo del ratón.

Estos pasos se pueden repetir para poner de nuevo la columna en orden descendente. Opcionalmente, ordene otras columnas en orden ascendente o descendente. Ordenar las columnas a menudo hace que resulte más fácil encontrar los datos, especialmente cuando la lista contiene grandes cantidades de datos.


Ajustar una red

 Visión de Conjunto y Más Información

El ajuste de una red es un proceso iterativo que comienza con un ajuste mínimamente limitado, seguido por sucesivos ajustes. Aquí se ofrecen normas básicas para iniciar ajustes junto con referencias a otros temas en los que se incluyen instrucciones más específicas para realizar acciones destinadas a llevar la red a su convergencia en forma progresiva.

Antes de iniciar el primer ajuste, repase estos temas:

1.	Datum de ajuste

2.	Estilos de ajuste de redes

3.	Observaciones

4.	Puntos

5.	Fijar punto(s)

6.	Incluir y excluir

7.	Configurar Estrategia de Ponderación Escalar

8.	Cargar y descargar separaciones de geoide

9.	Crear o editar grupos de varianza

10.	Crear o editar grupos de transformación

Ajustes

Para iniciar el ajuste, siga estos pasos:

1.	Para empezar el ajuste, use una de las siguientes alternativas:

  Seleccione Ajuste / Ajustar.

  Pulse F10.

Conforme avanza el ajuste de la red, en la barra de estado se muestran los mensajes de progreso y en la ventana Gráficos se muestran los resultados del ajuste

2.	Una vez completado el ajuste, vea el informe Ajuste de redes y evalúe los resultados.

Junto a los datos generados durante el ajuste, el informe contiene un mensaje que indica si se ha logrado o no el ajuste.


Descargar separaciones de geoide

 Visión de Conjunto y Más Información

Las separaciones de geoide pueden descargarse del ajuste.

NOTA: Las separaciones de geoide descargadas sólo se quitan del ajuste, no del proyecto. El geoide seguirá siendo seleccionado para el proyecto y usado en recálculos.

NOTA: Este archivo de ayuda emplea el término ‘observaciones de geoide' para describir las separaciones de geoide utilizadas en los ajustes de redes.

Para descargar las separaciones de geoide:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones

2.	Seleccione la ficha geoide.

3.	Para decidir si las separaciones pueden descargarse o no, use una de las siguientes alternativas:

  Si la lista Observaciones está vacía, las separaciones de geoide no están cargadas en el proyecto, y habrá que completar este procedimiento.

  Si se hubieran cargado previamente las separaciones de geoide, las observaciones se mostrarán en la lista Observaciones, y se podrá detener aquí este procedimiento.

4.	Haga clic en Descargar. Las separaciones de geoide se descargan del ajuste y se borra la lista Observaciones

5.	Haga clic en Aceptar.

Los cambios se guardan.


Usar datos de GPSurvey

 Visión de Conjunto y Más Información

El software Trimble Geomatics Office puede utilizarse con datos de las redes en Trimble GPSurvey. Se necesita un paso de importación extra. Hay que importar al proyecto los archivos de soluciones de las líneas base (.ssf y .ssk) y luego ajustar estas líneas base (observaciones) mediante el software Trimble Geomatics Office. Además, hay que importar los puntos de control conocidos utilizando un archivo ASCII generado en GPSurvey.

Para importar datos GPSurvey:

1.	Cree un nuevo proyecto en el software Trimble Geomatics Office. Elija las mismas propiedades del proyecto seleccionadas para el proyecto GPSurvey.

2.	Para seleccionar el comando Importar, seleccione Archivo / Importar.

3.	Seleccione la ficha Datos de Survey.

4.	Seleccione archivos SSF/SSK (*.ssf, *.ssk).

5.	Haga clic en Aceptar.

6.	Navegue a la carpeta \GPSurvey\Proyectos\*nombreproyecto*\Trimvec, que contiene los archivos deseados.

7.	Resalte los archivos deseados.

8.	Haga clic en Abrir. Comenzará la importación y las líneas base se mostrarán en la pantalla.

9.	Utilice la ficha Personalizar diálogo Importar para importar el archivo ASCII, realizando los pasos, antes citados.

Ahora ya está preparado para importar datos GPS adicionales e iniciar el ajuste en el software Trimble Geomatics Office.


Verificar los parámetros de transformación

 Visión de Conjunto y Más Información

Los parámetros de transformación pueden verificarse en cualquier momento entre ajustes.

Para verificar los parámetros de transformación:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de Transformación.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Desplácese por la lista hasta el grupo deseado.

4.	Seleccione el grupo.

5.	Haga clic en Editar. Aparecerá el diálogo Editar grupo de transformación.

El campo Nombre del grupo muestra el nombre asignado al grupo. Vea las observaciones en el grupo en la lista Observaciones del grupo y las observaciones disponibles del proyecto en la lista Observaciones Disponibles. La lista Parámetros de transformación en la parte superior izquierda muestra las configuraciones actuales de los parámetros de transformación.

6.	Verifique los parámetros de transformación en la lista Parámetros transformación.

7.	Si es necesario, edite los parámetros de transformación.

Estos temas ofrecen las normas para definir los parámetros de transformación:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura

8.	Para salir del diálogo, use una de las siguientes alternativas:

  Si sólo estaba verificando los parámetros de transformación, haga clic en Cancelar. No se guardará ningún cambio.

  Si se editaron los parámetros de transformación, haga clic en Aceptar y se guardarán los cambios.


Ver los resultados de la pruebas de Chi cuadrada

 Visión de Conjunto y Más Información

El campo Prueba de Chi cuadrada es una evaluación del Factor de referencia de la red (RF) y los grados de libertad. Si el RF está próximo a 1.0, los grados de libertad son aceptables, la red concuerda matemáticamente. Luego, el ajuste de la red debiera pasar la prueba de chi cuadrada.

Para ver los resultados de la prueba de chi cuadrada:

1.	Seleccione Informes / Informe Ajuste de redes. Se iniciará el visor HTML por defecto y aparecerá el informe Ajuste de redes con la cabecera Ajuste en su parte superior.

2.	En el índice de materias, al lado izquierdo de la pantalla, haga clic en Estadísticas globales. Aparecerá el campo Prueba de chi cuadrada.

3.	Cuando termine la sesión, salga del visor.


Ver el estado de fijación de los puntos de control

El Estado Fijo de los puntos de control incluidos en un ajuste de red pueden verse entre ajustes.

1.	Seleccione Ajuste / Puntos. Aparecerá el diálogo Puntos.

2.	Utilice la barra de desplazamiento para ver los puntos de control.

El estado Fijo de los componentes de las coordenadas de un punto de control está seleccionado cuando aparece una marca de verificación y borrado cuando no aparece ninguna marca de verificación. Además, la componente de la coordenada correspondiente aparecerá en la columna Fijo, o se quitarán los paréntesis de los identificadores de los puntos de control de calidad.

3.	Haga clic en Cancelar. Ningún cambio se guardará en el proyecto.

NOTA: La calidad de las coordenadas también puede verse en la ventana Propiedades. Si un punto tiene estado fijo, éste se muestra como control fijo.


Ver los grados de libertad

 Visión de Conjunto y Más Información

Utilice estas estadísticas para ver la cantidad de redundancia en la red.

Para ver el valor Grados de libertad:

1.	Para ver el informe, seleccione Informes / Informe Ajuste de redes. Se iniciará el visor HTML por defecto y aparecerá el informe Ajuste de redes con la cabecera Ajuste en su parte superior.

2.	En el índice de materias al lado izquierdo de la pantalla, haga clic en Estadísticas globales.

El campo Grados de libertad está situado en esta sección del informe.

Este campo representa el número de observaciones independientes incluidas en el ajuste que se utilizan para sobredeterminar las soluciones. Cuanto mayor sea el número, mejor, siempre que todas las observaciones sean independientes. Para más información, vea el tema Cómo seleccionar líneas base independientes.

3.	Cuando termine la sesión, salga del visor HTML.


Ver el factor de referencia de la red

 Visión de Conjunto y Más Información

Este valor muestra qué tan bien los errores de ajuste a posteriori calzan con los residuales de observación. Esto es, el factor de referencia de la red le permite saber qué tan bien los errores aleatorios calzan con los errores estimados para estas observaciones.

Para ver el valor del Factor de referencia de la red:

1.	Para ver el informe, seleccione Informes / Informe Ajuste de redes.

Se iniciará el visor HTML por defecto y aparecerá el informe Ajuste de redes con la cabecera de Ajuste en su parte superior.

2.	En el índice de materias al lado izquierdo de la pantalla, haga clic en Resumen Estadístico.

El campo Factor de ajuste de la red está situado en esta sección del informe.

3.	Cuando termine la sesión, seleccione el comando para salir del visor HTML (generalmente Archivo / Salir).


Ver el informe Ajuste de redes

 Visión de Conjunto y Más Información

Tras completar un ajuste, vea el informe Ajuste de redes.

1.	Para ver el informe, seleccione Informes / Informe Ajuste de redes. En el visor HTML por defecto de su computadora se mostrará el Informe de ajuste de redes.

2.	Utilice estas normas para ver los resultados del ajuste:

  Haga clic en los hipervínculos al lado izquierdo de la pantalla para desplazarse a una sección del informe.

  Utilice el comando en el visor HTML para volver a la parte superior de una página. La mayoría de los visores disponen de un botón Retorno para estos fines.

  Utilice las teclas Re pág y Av pág, las barras de desplazamiento, o cualquier otro tipo de comandos el el visor HTML para navegar a través del informe.

  Pulse Alt+Tab para cambiar entre el visor HTML y el software Trimble Geomatics Office. Cada vez que pulse Alt+Tab se cambia a la próxima ventana abierta.

  Dado que el visor HTML por defecto es una aplicación independiente, se le puede minimizar en la barra de tareas y volver al software Trimble Geomatics Office para hacer cambios en los ajustes, de acuerdo con sus evaluaciones. Luego puede volver al informe maximizando la ventana del visor HTML para realizar ulteriores evaluaciones. Este proceso se puede repetir tantas veces como sea necesario para la sesión de evaluación actual del informe.

  Tal vez prefiera imprimir el informe para hacer sus evaluaciones. Para imprimir el informe, utilice el comando Imprimir en el visor HTML (generalmente Archivo / Imprimir).

  Los informes pueden registrarse en un archivo con el fin de archivarlo, o para su posterior impresión, lo cual se realiza imprimiendo el informe en un archivo

  Si dispone de una copia de Adobe® Acrobat®, puede imprimir los informes en un archivo y luego destilar el archivo. Esto le proporciona una documentación de los informes, completa con hipervínculos.

  Los informes se pueden remitir a otros mediante el comando de correo electrónico de su visor HTML. Para aplicaciones en tiempo real, esto puede resultar útil para enviar informes a los observadores móviles en el campo. También puede resultar útil para transferir datos de informes desde el campo a un archivo central.

3.	Cierre el visor HTML.


Ver observaciones
Ver observaciones seleccionadas para el ajuste

 Visión de Conjunto y Más Información

Vea la lista de Observaciones para revisar las observaciones usadas en el ajuste.

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide. Aparecerá la lista de Observaciones seleccionada.

3.	Utilice la barra de desplazamiento para navegar por la lista.

4.	Después de ver las observaciones, haga clic en Cancelar.

No se guarda ningún cambio en el proyecto.


Ver observaciones de grupo de transformación

 Visión de Conjunto y Más Información

Las observaciones de grupo de transformación pueden verse en cualquier momento entre ajustes.

Para ver las observaciones de grupo de transformación:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de Transformación .

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Desplácese por la lista hasta el grupo deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar Grupo de Transformación.

El campo Nombre del grupo muestra el nombre asignado al grupo. Vea las observaciones en el grupo en la lista Observaciones del grupo y las observaciones disponibles del proyecto en la lista Observaciones Disponibles.

5.	Después de ver las observaciones del grupo, haga clic en Cancelar.

No se guarda ningún cambio en el proyecto.


Ver grupos de transformación

 Visión de Conjunto y Más Información

Los grupos de transformación pueden verse en cualquier momento entre ajustes.

Para ver grupos de transformación:

1.	Seleccione Ajuste / Grupos de observación/ Grupos de transformación. Aparecerá el diálogo Grupos de Transformación.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Desplácese por la lista hasta el grupo deseado.

4.	Seleccione el grupo.

5.	Haga clic en Editar. Aparecerá el diálogo Editar Grupo de Transformación

El campo Nombre del Grupo muestra el nombre asignado al grupo. Vea las observaciones en el grupo en la lista Observaciones del Grupo y las observaciones disponibles del proyecto en la lista Observaciones disponibles. La Lista Parámetros Transformación en la parte superior izquierda muestra las configuraciones actuales de los parámetros de transformación.

SUGERENCIA: También puede ver los parámetros de transformación en la ficha Ajuste de la ficha Sistema de Coordenadas detallado en la ventana Propiedades del Proyecto.

6.	Después de ver el grupo, haga clic en Cancelar.

No se guarda ningún cambio en el proyecto.


Ver los parámetros de transformación

 Visión de Conjunto y Más Información

Los parámetros de transformación pueden verse entre ajustes.

SUGERENCIA: También puede ver los parámetros de transformación en la ficha Ajuste de la ficha Sistema de Coordenadas detallado en la ventana Propiedades del Proyecto.

Para ver los parámetros de transformación:

1.	Seleccione Ajuste / Grupos de observación/ Grupos de Transformación. Aparecerá el diálogo Grupos de Transformación .

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione en la lista el grupo de transformación deseado.

4.	Haga clic en Editar. Aparecerá el diálogo Editar Grupo de Transformación .

La lista Parámetros transformación está situada en el lado superior izquierdo de los diálogos, debajo del campo Nombre del grupo.

Para más información acerca de parámetros individuales, véanse estos temas:

  Desvío en Longitud

  Desvío en Latitud

  Rotación de Acimut

  Escala de la Red

  Escala de Distancia

  Constante de Distancia

  Constante de Altura

NOTA: Los parámetros Rotación de Acimut, Escala de la Red, Escala de Distancia, y Constante de Distancia no se utilizan para las transformaciones de geoide.

Para más información, véase Parámetros de Transformación.


Ver observaciones de grupo de varianza

 Visión de Conjunto y Más Información

Siga estos pasos para ver las observaciones de geoide o GPS de un Grupo de Varianza.

1.	Seleccione Ajuste/ Grupos de observación/ Grupos de varianza. Aparecerá el diálogo Grupos de Varianza.

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione un grupo de varianza.

4.	Haga clic en Editar. Aparecerá el diálogo Editar Grupo de Varianza con la lista de observaciones.

5.	Utilice la barra de desplazamiento para moverse por la lista de observaciones.

6.	Haga clic en Cancelar. No se guarda ningún cambio en el proyecto.


Incluir una línea base en los ajustes de redes

 Visión de Conjunto y Más Información

Si por cualquier razón se quitó una línea base de un ajuste de red se pueden cambiar las propiedades de la línea base para incluir ésta en futuros ajustes de la red.

NOTA: Para que sea incluida en un ajuste de red, la línea base también debe ser habilitada.

Para incluir una línea base en futuros ajustes de la red:

1.	Haga doble clic en la línea base. La ventana de Propiedades aparecerá.

2.	En la ventana de Propiedades, abra la Página de Resumen.

3.	Seleccione la casilla de verificación de Uso en el ajuste de red para incluir la línea base en los futuros ajustes.

4.	Tras completar los cambios, pulse Aceptar.


Quitar una observación de un ajuste de red

 Visón de Conjunto y Más Información

Puede quitar una observación de ajustes de red futuros cambiando sus propiedades:

Para hacer esto:

1.	Haga doble-clic en la observación. La ventana Propiedades aparecerá.

2.	Haga clic en el botón [image] en la página de Resumen. En la página de Resumen, la casilla de verificación de Usar ajuste de red está seleccionada si la línea base se incluye en los ajustes de red futuros.

3.	Borre esta casilla. Se quitará la observación de los futuros ajustes de red.

4.	Después de completar los cambios, haga clic en ACEPTAR.

NOTA: También puede quitar una observación de un ajuste de red en el diálogo Observaciones.


Excluir observaciones de un ajuste
Excluir observaciones de un ajuste de red

 Visión de Conjunto y Más Información

Todas las observaciones ajustables se marcan para el ajuste cuando se importan observaciones. Sin embargo, las observaciones individuales puedes excluirse de un ajuste usando el diálogo de Observaciones. El exlcluir una observación no la borra del proyecto.

Para excluir observaciones:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Seleccione la ficha GPS o Terrestre.

3.	En la lista de Observaciones, ubique la observación que desee excluir.

SUGERENCIA: Las observaciones en la lista Observaciones disponibles se pueden filtrar para mostrar u ocultar los tipos de observación. La ocultación temporal de los tipos de observación seleccionados reduce el tamaño de la lista, lo que facilita la tarea de encontrar las observaciones.

4.	Verifique que esté inhabilitada la casilla de verificación en el campo Usar columna de la observación.

5.	Tras excluir las observaciones, haga clic en Aceptar para guardar los cambios en el proyecto.

NOTA: La Observaciones también se pueden excluir de un ajuste borrando la opción Usar en ajuste de red en la página de Resumen de la ventana de Propiedades.

Las Observaciones que han sido excluidas de un ajuste pueden ser incluidas nuevamente.

NOTA: Las observaciones también pueden ser inhabilitadas y rehabilitadas. Para más información, véase Inhabilitar Observaciones y Rehabilitar Observaciones Inhabilitadas.


Rehabilitar observaciones inhabilitadas para ajustes y recálculos
Rehabilitar observaciones inhabilitadas para ajustes

 Visión de Conjunto y Más Información

Las observaciones inhabilitadas en el diálogo Observaciones o en la ventana gráficos pueden ser rehabilitadas. Una vez rehabilitadas, las observaciones aparecen en el diálogo Observaciones y pueden ser usadas para futuros ajustes y recálculos de redes.

NOTA: Rehabilitar una observación e incluir una observación son dos operaciones diferentes. Las observaciones excluidas pueden ser incluidas en futuros ajustes de redes seleccionando la casilla de verificación Usar para la observación en el diálogo Observaciones o seleccionando la casilla de verificación Usar en ajuste de red en la página de Resumen de la ventana de Propiedades. Las observaciones inhabilitadas no pueden ser rehabilitadas en el diálogo Observaciones—deben ser rehabilitadas seleccionando la observación y viendo la ventana Propiedades en la ventana Gráficos. Para más información, véase Incluir Observaciones en un Ajuste.

Para habilitar observaciones en la ventana Gráficos:

1.	Haga doble clic en la observación. Las observaciones inhabilitadas se resaltan en rojo en la ventana Gráficos.

2.	2.	Aparecerá la ventana Propiedades.

3.	Haga clic en el botón de página de Resumen [image] para abrir la página de Resumen.

4.	En la lista Estado, seleccione Habilitar.

5.	Verifique que la casilla de verificación Usar en ajuste de red esté seleccionada.

6.	La observación es rehabilitada y será utilizada en futuros ajustes y recálculos de redes. La observación ya no aparecerá en rojo en la ventana Gráficos.

NOTA: Para más información acerca de la inclusión y exclusión de observaciones, véanse Incluir Observaciones y Excluir Observaciones.


Combinar diferentes tipos de observaciones en un ajuste de red

Puede combinar observaciones GPS, terrestres, o de geoide en un ajuste de red para producir un conjunto de coordenadas ajustadas.

Para combinar observaciones, puede unir las observaciones terrestres a la red GPS. De lo contrario, cuando lleve a cabo un ajuste, aparecerá un mensaje de error. Para hacer esto, mida ángulos y distancias en los puntos que sean comunes con la red GPS. Utilice por lo menos dos puntos comunes (puntos observados en ambos grupos de datos GPS y terrestres, o puntos de control) los que pueden juntar los dos grupos de datos. Esto previene que una poligonal terrestre quede “colgada” de una observación GPS por un sólo punto.

Antes de llevar a cabo un ajuste de red totalmente limitado, revise cada grupo de observaciones de modo que pueda ubicar cualquier error fácilmente. También necesita llevar a cabo, en forma separada, ajustes mínimamente limitados de observaciones GPS y terrestres.

El procedimiento recomendado para combinar observaciones en un ajuste de red incluye varios pasos básicos. Las siguientes secciones resumen brevemente este flujo de trabajo.

1.  Importe sus datos

a.	Si tiene puntos de calidad de control asociados a su proyecto, importe primero estos puntos al proyecto de Trimble Geomatics Office. Esto asegura que estas coordenadas de control se usen como puntos de partida en un recálculo. Para más información, vea Recálculo y La importancia de la homegenización de coordenadas en un ajuste de red.

b. 	Importe cualquier otro grupo de datos a su proyecto. Verifique e investigue cualquier tipo de avisos de error.

NOTA: Al importar los datos, y el no tener seleccionada la opción de Unir siempre puntos duplicados en el diálogo de Opciones de Puntos Duplicados, va a necesitar unir los puntos duplicados.

2.	Prepare los datos GPS

Para llevar a cabo un ajuste mínimamente limitado en sus observaciones GPS, haga lo siguiente:

a.	Seleccione sus dados GPS data en la ventana de gráficos.

b.	Procese sus datos GPS.

c.	Lleve a cabo los cierres de módulos GPS y vea el informe de Módulo de Cierre para verificar que sus observaciones GPS sean adecuadas para el ajuste.

d.	Quite todas los avisos que estén fuera de tolerancia. Estos pueden haber ocurrido por coordenadas de control incorrectas, alturas de antena erróneas, y nombres de puntos incorrectos.

e.	Seleccione líneas base GPS independendientes.

f.	Seleccione el datum WGS-84.

g.	Seleccione el estilo del ajuste. Si es necesario, altere las configuraciones de estilos de ajuste.

h.	En la ficha GPS del diálogo de Observaciones, seleccione las observaciones a incluir en el ajuste.

CONSEJO: Utilice el botón Filtro en el diálogo de Observaciones para filtrar los tipos de observaciones.

i.	Si es necesario, defina los grupos de Observación (varianza y/o grupos de transformación) para los datos.

j.	Fije un punto de control en el diálogo Puntos. Esto es opcional.

k	Configure la estrategia de ponderación. (Para el ajuste inicial, configure el tipo de observación a Todas las Observaciones y el Tipo de Escalar a Por defecto.)

l.	Lleve a cabo un ajuste mínimamente limitado.

m	Vea los detalles del ajuste en el informe de Ajuste de Red.

n.	Si es necesario, configure el tipo de escalar a Alternativo, ejecute más ajustes, y revise el informe de Ajuste de Red. Haga ésto hasta que el ajuste pase la prueba Chi-cuadrada y usted esté satisfecho con los resultados del ajuste.

NOTA: Si selecciona la opción Tipo escalar automático en el diálogo de Estrategias de Ponderación, las iteraciones de ajuste se llevan a cabo hasta que el ajuste pase la prueba Chi-cuadrada.

o.	Si selecciona la opción Escalar Alternativo, cuando haya completado la última iteración, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

p.	Si pretende llevar a cabo una Calibración Local GPS, guarde las coordenadas de calibración. Se guardarán las coordenadas WGS-84.

Sus observaciones GPS están listas ahora para un ajuste totalmente limitado.

3.  Prepare los datos terrestres

Para llevar a cabo un ajuste mínimamente limitado con sus datos terrestres, haga lo siguiente:

a.	Seleccione sus observaciones terrestres en la ventana de gráficos.

CONSEJO: Puede usar los filtros de vista para ver sólo las observaciones terrestres.

b.	Seleccione el datum del proyecto.

c.	En la ficha Terrestre del diálogo de Observaciones, seleccione las observaciones a ser incluidas en el ajuste.

NOTA: Si sus datos terrestres no consisten en una poligonal cerrada (es decir, las observaciones terrestres están colgando de una red de observación GPS), también necesitará cargar las observaciones de geoide para asegurar que las observaciones GPS y terrestres se puedan juntar usando el geoide. Si en este momento incorpora datos de geoide en su ajuste terrestre, no necesita seguir el paso 4 más abajo.

d.	Si es necesario, defina grupos de Observación (varianza y/o grupos de transformación) para los datos.

e.	Configure la estrategia de ponderación. Para el primer ajuste, configure el tipo de observación a Todas las Observaciones y el tipo de escalar a Por Defecto.

f.	Fije un punto en el diálogo Puntos.

NOTA: Para poder llevar a cabo un ajuste combinado, el punto que usted fija debe ser uno de los puntos comunes entre el GPS y la red terrestre.

g.	Lleve a cabo un ajuste mínimamente limitado.

h.	Vea los detalles del ajuste en el informe de Ajuste de la Red.

i.	Si es necesario, configure el tipo de escalar a Alternativo, ejecute otro ajuste, y revise el informe de Ajuste de la Red. Haga esto hasta que esté satisfecho con los resultados del ajuste.

NOTA: Si seleccionó la opción escalar Automático en el diálgo de Estrategias de Ponderación, las iteraciones de ajuste se llevan a cabo hasta que el ajuste pasa la prueba Chi-cuadrado.

j.	Si ha usado la opción Escalar Alternativo, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

Sus observaciones terrestres están listas ahora para un ajuste totalmente limitado.

4.	Incorporar observaciones de geoide en su ajuste

Los errores de geoide se ajustan en una escala de ajuste limitado de las observaciones. Para realizar un ajuste verticalmente limitado de sus datos de geoide, haga lo siguiente:

a.	Verifique que un modelo geoidal haya sido seleccionado para el proyecto. Para hacer esto, revise los detalles del sistema de coordenadas en el diálogo de Propiedades del Proyecto.

b. 	En el diálogo de Observaciones, seleccione la ficha de Geoide y cargue las observaciones de Geoide.

c. 	Configure la estrategia de ponderación del geoide. Para el ajuste inicial, configure el tipo escalar a Por defecto.

d.	Fije las elevaciones (y/o alturas) en el diálogo de Puntos. Por lo menos tres límites son recomendados.

e.	Lleve a cabo un ajuste.

f.	Vea los detalles del ajuste en el informe de Ajuste de la Red.

g.	Si es necesario, configure el tipo de escalar a Alternativo, ejecute otro ajuste, y revise el informe de Ajuste de Red. Haga ésto hasta que el ajuste pase la prueba Chi-cuadrada y usted esté satisfecho con los resultados del ajuste.

h.	Si ha seleccionado la opción tipo de escalar Alternativo, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

5.	Ejecute un ajuste limitado horizontalmente

Puede ejecutar un ajuste totalmente limitado una vez que haya trabado el error de escala en el ajuste mínimamente limitado.

Para hacer esto:

a.	Verifique que el datum del proyecto siga estando seleccionado.

b.	Fije los puntos de control en el diálogo Puntos.

NOTA: Para  poder ejecutar un ajuste combinado debe fijar por lo menos dos puntos GPS. Si es posible, estos puntos deben ser los puntos comunes entre el GPS y la red terrestre.

c.	Ejecute el ajuste.

d.	Vea los resultados del ajuste en el informe de Ajuste de la Red.

e.	Si es necesario, ejecute más ajustes hasta que esté satisfecho con los resultados del ajuste.

CONSEJO: Si el ajuste no converge, la prueba Chi-cuadrado falla o el Factor de Referencia no es aceptable entonces puede haber problemas con el control de coordenadas. Suelte los puntos (uno por uno) en el diálogo de Puntos y lleve a cabo un ajuste totalmente limitado nuevamente hasta que encuentre el punto malo. Para más información acerca de la solución de este tipo de problemas, vea la Guía del Usuario de Ajustes de Red.


Ejecutar un ajuste de red en observaciones GPS

El siguiente es un breve resumen del flujo de trabajo requerido para ajustar observaciones GPS en el software Trimble Geomatics Office:

1.	Importar datos de control

a.	Si tiene puntos de calidad de control asociados a su proyecto, importe primero estos puntos al proyecto de Trimble Geomatics Office. Esto asegura que estas coordenadas de control se usen como puntos de partida en un recálculo. Para más información, vea Recálculo y La importancia de la homegenización de coordenadas en un ajuste de red.

b.	Importe cualquier otro grupo de datos a su proyecto. Verifique e investigue cualquier tipo de avisos de error.

NOTA: Al importar los datos, y no tener seleccionada la opción de Unir siempre puntos duplicados en el diálogo de Opciones de Puntos Duplicdos, va a necesitar unir los puntos duplicados.

2.	Prepare los datos GPS

a.	Procese sus datos GPS.

b. 	Lleve a cabo los cierres de módulos GPS y vea el informe de Módulo de Cierre para verificar que sus observaciones GPS sean adecuadas para el ajuste.

c. 	Quite todas los avisos que estén fuera de tolerancia. Estos pueden haber ocurrido por coordenadas de control incorrectas, alturas de antena erróneas, y nombres de puntos incorrectos.

d.	Seleccione líneas base GPS independendientes.

e.	Seleccione el datum WGS-84.

f.	Seleccione el estilo del ajuste. Si es necesario, altere las configuraciones de estilos de ajuste.

g. 	En la ficha GPS del diálogo de Observaciones, seleccione las observaciones a incluir en el ajuste.

CONSEJO: Utilice el botón Filtro en el diálogo de Observaciones para filtrar los tipos de observaciones.

h.	Si es necesario, defina los  grupos de Observación (varianza y/o grupos de transformación) para los datos.

i.	Fije un punto de control en el diálogo Puntos. Esto es opcional.

j	Configure la estrategia de ponderación. (Para el ajuste inicial, configure el tipo de observación a Todas las Observaciones y el Tipo de Escalar a Por defecto.)

k.	Lleve a cabo un ajuste mínimamente limitado.

l.	Vea los detalles del ajuste en el informe de Ajuste de Red.

m.	Si es necesario, configure el tipo de escalar a Alternativo, ejecute más ajustes, y revise el informe de Ajuste de Red. Haga ésto hasta que el ajuste pase la prueba Chi-cuadrada y usted esté satisfecho con los resultados del ajuste.

NOTA: Si selecciona la opción Tipo escalar automático en el diálogo de Estrategias de Ponderación, las iteraciones de ajuste se llevan a cabo hasta que el ajuste pase la prueba Chi-cuadrada.

n.	Si selecciona la opción Escalar Alternativo, cuando haya completado la última iteración, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

o.	Si pretende llevar a cabo una Calibración Local GPS, guarde las coordenadas de calibración. Se guardarán las coordenadas WGS-84.

Sus observaciones GPS están listas ahora para un ajuste totalmente limitado.

3.	Incorporar las observaciones de geoide en su ajuste

Los errores de geoide se ajustan en una escala de ajuste limitado de las observaciones. Para realizar un ajuste verticalmente limitado de sus datos de geoide, haga lo siguiente:

a.	Verifique que un modelo geoidal haya sido seleccionado para el proyecto. Para hacer esto, revise los detalles del sistema de coordenadas en el diálgo de Propiedades del Proyecto.

b.	En el diálogo de Observaciones, seleccione la ficha de Geoide y cargue las observaciones de Geoide.

c.	Configure la estrategia de ponderación del geoide. Para el ajuste inicial, configure el tipo escalar a Por defecto.

d. 	Fije las elevaciones (y/o alturas) en el diálgo de Puntos. Por lo menos tres límites son recomendados.

e.	Lleve a cabo un ajuste.

f. 	Vea los detalles del ajuste en el informe de Ajuste de la Red.

g.	Si es necesario, configure el tipo de escalar a Alternativo, ejecute otro ajuste, y revise el informe de Ajuste de Red. Haga ésto hasta que el ajuste pase la prueba Chi-cuadrada y usted esté satisfecho con los resultados del ajuste.

h.	Si ha seleccionado la opción tipo de escalar Alternativo, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

4.	Ejecute un ajuste limitado horizontalmente

Puede ejecutar un ajuste totalmente limitado una vez que haya trabado el error de escala en el ajuste mínimamente limitado.

Para hacer esto:

a.	Verifique que el datum del proyecto siga estando seleccionado.

b.	Fije los puntos de control en el diálogo Puntos.

c.	Ejecute el ajuste.

d.	Vea los resultados del ajuste en el informe de Ajuste de la Red.

e.	Si es necesario, ejecute más ajustes hasta que esté satisfecho con los resultados del ajuste.

CONSEJO: Si el ajuste no converge, la prueba Chi-cuadrado falla o el Factor de Referencia no es aceptable entonces puede haber problemas con el control de coordenadas. Suelte los puntos (uno por uno) en el diálogo de Puntos y lleve a cabo un ajuste totalmente limitado nuevamente hasta que encuentre el punto malo. Para más información acerca de la solución de este tipo de problemas, vea la Guía del Usuario de Ajustes de Red.


Ejecutar un ajuste de red en observaciones terrestres

Las siguientes secciones resumen brevemente el flujo de trabajo requerido para ajustar observaciones terrestres en el software Trimble Geomatics Office:

NOTA: Si pretende llevar a cabo un ajuste de red usando los datos transferidos desde el software de Trimble Survey Controller, verifique que haya introducido una presión, una temperatura, y las correcciones por temperatura y refracción en el estilo del Survey Controller cuando se ejecute el levantamiento. También necesita tener una proyección definida para el proyecto.

1. Importar datos de control

a.	Si tiene puntos de calidad de control asociados a su proyecto, importe primero estos puntos al proyecto de Trimble Geomatics Office. Esto asegura que estas coordenadas de control se usen como puntos de partida en un recálculo. Para más información, vea Recálculo y La importancia de la homegenización de coordenadas en un ajuste de red.

b.	Importe cualquier otro grupo de datos a su proyecto. Verifique e investigue cualquier tipo de avisos de error.

NOTA: Cuando importe los datos, y no tenga seleccionada la opción de Unir siempre puntos duplicados en el diálogo de Opciones de Puntos Duplicdos, necesita unir los puntos duplicados.

2.	Prepare los datos terrestres

Para ejecutar un ajuste mínimamente limitado sobre sus datos terrestres, haga lo siguiente:

a.	Importe y verifique los datos terrestres (investigue los avisos de error que se generan).

b.	Si tiene puntos duplicados en el proyecto, y no tiene seleccionada la opción Siempre unir puntos duplicados en el diálogo de opciones de Puntos Duplicados, necesita unir los puntos duplicados.

c.	Seleccione el datum del proyecto.

d.	En la ficha Terrestre del diálogo de Observaciones, seleccione la observación a ser incluida en el ajuste.

e.	Si es necesario, defina los grupos de Observación (varianza y/o grupos de transformación) para los datos.

f.	Configure la estrategia de ponderación. Para el primer ajuste, configure el tipo de observación a Todas las Observaciones y el Tipo de Escalar a Por defecto.

g.	Lleve a cabo un ajuste mínimamente limitado.

h.	Vea los detalles del ajuste en el informe de Ajuste de Red.

i.	Si es necesario, configure el tipo de escalar a Alternativo y ejecute más ajustes hasta que esté satisfecho con los resultados del ajuste.

NOTA: Si selecciona la opción Tipo escalar automático en el diálogo de Estrategias de Ponderación, las iteraciones de ajuste se llevan a cabo hasta que el ajuste pase la prueba Chi-cuadrada.

j.	Si selecciona la opción Escalar Alternativo, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

Sus observaciones terrestres están listas ahora para un ajuste totalmente limitado.

2.	2.	Ejecute un ajuste limitado horizontalmente

Puede ejecutar un ajuste totalmente limitado una vez que haya trabado el error de escala en el ajuste mínimamente limitado. Para hacer esto:

a.	Verifique que el datum del proyecto siga estando seleccionado.

b.	Fije los puntos de control en el diálogo Puntos.

c.	Ejecute el ajuste.

d.	Vea los resultados del ajuste en el informe de Ajuste de la Red.

e.	Si es necesario, ejecute más ajustes hasta que esté satisfecho con los resultados del ajuste.

CONSEJO: Si el ajuste no converge, la prueba Chi-cuadrado falla o el Factor de Referencia no es aceptable entonces puede haber problemas con el control de coordenadas. Suelte los puntos (uno por uno) en el diálogo de Puntos y lleve a cabo un ajuste totalmente limitado nuevamente hasta que encuentre el punto malo. Para más información acerca de la solución de este tipo de problemas, vea la Guía del Usuario de Ajustes de Red.


Importar observaciones de nivel

El siguiente es un breve resumen del flujo de trabajo requerido para ajustar observaciones de nivel en el software Trimble Geomatics Office:

1.  Importar observaciones de nivel

Haga lo siguiente:

a.	Seleccione Archivo / Importar. El diálogo de Importar aparece.

b.	En la ficha de Levantamiento, seleccione Archivos de Nivel Digital (*.dat, *.raw). Aparece el diálogo Abrir.

c.	Seleccione el archivo de nivel digital a importar. El diálogo Importar Nivel Digital aparece. Utilice este diálogo para revisar las observaciones de nivel.

d.	Haga clic en ACEPTAR.

El archivo de nivel digital es importado.

NOTA: También puede importar manualmente elevaciones delta en el proyecto usando el  Formato Trimble Data Exchange.

NOTA: Para ver la información de nivel en el informe de Nivel, seleccione Informes / Informes de Nivel.

2.  Ver las observaciones de nivel

Cuando se importan datos de nivel digital, normalmente no hay coordenadas horizontales asociadas con las elevaciones por lo que no puede verlas en la vista de Levantamiento ( a menos que ya existan coordenadas horizontales para el punto en el proyecto y los puntos duplicados hayan sido unidos). Sin embargo, usted puede ver las observaciones de nivel en la ventana de Propiedades. Para hacer ésto:

a.	Elija Seleccionar  / Todo.

b.	Haga una de las siguientes:

  Seleccione Editar / Propiedades.

  Teclee Alt + Introducir.

  Seleccione la herramienta de la Ventana de Propiedades de la barra de herramientas.

Ahora puede ver las observaciones de nivel.

3.  Ejecutar un ajuste mínimamente limitado

Para ajustar observaciones de nivel, haga lo siguiente:

a.	Seleccione el datum del proyecto.

b.	Seleccione el estilo de ajuste de la red.

c.	Seleccione las observaciones a incluir en el ajuste desde el diálogo de Observaciones.

CONSEJO: Utilice el filtro en el diálogo de Observaciones para seleccionar sólo observaciones de elevación delta.

d.	Cargue las observaciones de Geoide en la ficha de Geoide – diálogo de Observacioenes.

e.	En la ficha Terrestre del diálogo de Observaciones, defina los grupos de Observación (varianza y/o grupos de transformación) para los datos.

f.	Configure la estrategia de ponderación terrestre. Para hacer esto, en el diálogo de Estrategias de Ponderación, seleccione la ficha Terrestre. Luego, en los grupos Aplicar Escalares a y Tipo de Escalar, seleccione las opciones apropiadas.

g.	Fije un punto en el diálogo de Puntos.

NOTA: Generalmente, este punto será el punto de estación para el cual definió una elevación en el diálogo Importar Nivel digital.

h.	Ejecute un ajuste mínimamente limitado.

i.	Vea los resultados del ajuste en el informe de Ajuste de la Red.

j.	Si es necesario, ejecute más ajustes hasta que esté satisfecho con los resultados del ajuste.

k.	Si ha utilizado la opción tipo de escalar Alternativo, trabe el valor escalar en el diálogo de Estrategias de Ponderación.

4. Ejecutar un ajuste totalmente limitado

a.	Verifique que el datum del proyecto siga estando seleccionado.

b.	Fije los puntos de control en el diálogo Puntos.

c.	Lleve a cabo un ajuste totalmente limitado

d.	Vea los resultados del ajuste en el informe de Ajuste de la Red.

e.	Si es necesario, lleve a cabo más ajustes hasta que esté satisfecho con los resultados del ajuste.

Cuando se haya completado el ajuse, se guarda un conjunto de coordenadas ajustadas para cada punto en el ajuste. Puede ver estas coordenadas en la ventana de Propiedades.


Usar tipo de escalar automático

En el diálgo de Estrategias de Ponderación, puede elegir de los siguientes tipos de escalares:

  Por defecto

  Alternativo

  Definido por el usuario

  Automático

Cuando inicia un ajuste, el software configura la estrategia de ponderación par aplicar los tipos escalares por defecto a todas las observaciones. En el ajuste, el escalar por defecto multiplica el error a priori por 1.00, dejando intactas las estimaciones de error.

Si el error estimado en sus observaciones calza con el error real, el factor de referencia  informado debe ser de aproximadamente 1.00. Si no es así, entonces debe ajustar el error estimado con respecto al error real. La manera más simple de aplicar el escalar es seleccionando el tipo de escalar alternativo. El tipo de escalar alternativo usa el factor de referencia del ajuste actual, multiplicado por el escalar previo, para determinar el escalar para el siguiente ajuste. Esto acerca a 1.00 el factor de referencia. El escalar alternativo se aplica a más ajustes de iteraciones hasta que pasa la prueba Chi-cuadrada.

Si selecciona la opción de escalar Automático, el proceso de seleccionar el tipo de escalar alterntativo es automático; esto es, se completan los ajustes hasta que pase la prueba Chi-cuadrado. Cuando esto ocurre, se traba el valor escalar.

NOTA: Cuando selecciona un tipo de escalar automático, el informe de Ajuste de Red muestra que el tipo de escalar alternativo  ha sido seleccionado.

La Importancia de la Detección de Equivocaciones

Las equivocaciones en el conjunto datos son responsables de la sobre escala de las otras observaciones (en el mismo grupo) en el ajuste, por lo tanto antes de usar el tipo de escalar automático verifique que se hayan quitado todas las equivocaciones.  Puede revisar que no hayan equivocaciones ni datos erróneos ejecutando el ajuste usando la opción de escalar por defecto, y luego revisando los resultados.

NOTA: Los avisos de error también indican posibles errores en el grupo de datos.

Después de usar la opción de tipo de escalar automático, revise cuidadosamente los resultados del ajuste, en particular los histogramas del ajuste,  para asegurar que no se haya ocultado una equivocación en las observaciones.

CUIDADO: Trimble le recomienda no usar la opción tipo de escalar Automático para escalar observaciones GPS y terrestres al mismo tiempo.


Diálogo puntos - Visión de conjunto
    Diálogo puntos − Visión de conjunto

Más información

Cómo ...	Véase también
Visión de conjunto

Utilice este diálogo para ver, evaluar, y limitar los puntos en un ajuste. Las coordenadas que se muestran en el diálogo de Puntos son las coordenadas actuales para el punto tal como se muestra en la ventana de Propiedades en la página de resumen. Después de un ajuste, el diálogo de Puntos muestra los valores de coordenadas ajustados.

NOTA: Si un punto está restringido (fijo) en el diálgo de Puntos, y actualmente no existe ninguna coordenada de control de calidad, entonces se almacena una coordenada para el punto.

Para ver el diálogo Puntos:

  Seleccione Ajuste / Puntos.

Estarán disponibles las siguientes opciones:

Ajuste del Datum

El ajuste del datum se muestra arriba en la lista de puntos.

Puntos

Utilice esta lista para ver los puntos conectados a observaciones en el ajuste de la red. Esta lista no refleja la lista completa de puntos incluidos en el proyecto. Para más información acerca de los campos de listas, véase Puntos.

Fijar

Utilice estas casillas de verificación para limitar las componentes de las coordenadas de los puntos individuales incluidos en el ajuste. Para más información, véase Fijar.

Vista de coordenadas

La vista determina los tipos de coordenadas almacenados en el proyecto.

Cuadrícula − Seleccione este botón para mostrar los puntos en la proyección cartográfica configurada en la ficha Sistema de coordenadas del diálogo Propiedades proyecto. Esta es la vista por defecto.

Local − Seleccione este botón para mostrar los puntos en coordenadas geográficas del datum del proyecto configurado en el diálogo Propiedades del proyecto.

WGS − Seleccione este botón para mostrar los puntos en coordenadas geográficas WGS-84


    Puntos

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Esta lista muestra los puntos conectados a las observaciones incluidas en el ajuste de la red y no refleja toda la lista de puntos incluidos en el proyecto.

Cada fila de la lista contiene los datos de un punto. Cuando se edita la componente de la coordenada del punto, el grupo Fijo se selecciona la casilla de verificación Estado fijo. Si se borra el estado Fijo en la casilla de verificación, la componente de coordenada que fue editada se vuelve a cambiar a la coordenada original.

SUGERENCIA: Las columnas de la lista se pueden mover a nuevas localizaciones en la lista, cambiar su tamaño para mostrar más o menos información, y ordenar en orden descendente o ascendente.

Están disponibles las siguientes columnas:

Columna	Lo que muestra
Punto	Esta columna muestra el nombre asignado al punto en el ajuste de la red.
Norte o Latitud local o Latitud WGS-84	Esta columna muestra la coordenada Norte del punto en la proyección cartográfica seleccionada para el proyecto o la coordenada Latitud del punto en el elipsoide del proyecto (local) o WGS-84.
Este o Longitud local o Latitud WGS-84	Esta columna muestra la coordenada Este del punto en la proyección cartográfica seleccionada para el proyecto o la coordenada Longitud del punto en el elipsoide del Proyecto (local) o WGS-84.
Altura	Esta columna lista la altura del punto por encima o por debajo del elipsoide del proyecto (local) o WGS-84. El valor se expresa en unidades del proyecto.
Elev	Esta columna lista la elevación del punto por encima o por debajo del nivel medio del mar. La elevación se muestra una vez que se han cargado y aplicado las separaciones de geoide. Este valor se expresa en unidades del proyecto.
Fijo	Esta columna lista el estado fijo (limitado) de cada componente de la  posición del punto. Cualquier identificador o grupo de identificadores de componentes de coordenada entre paréntesis indica que un punto tiene calidad de control y no está fijo. Cualquier identificador de componente de coordenadas o grupo de identificadores sin paréntisis muestra que la componente de coordenada está fija para el punto. Por ejemplo, si una componente contiene el grupo de identificadores (NE_e), esto significa que el Norte, Este, y elevación son de calidad control.
En la columna Fijo pueden aparecer los siguientes valores:

Presentación fija:	Qué está fijo:
____	El punto no está limitado en ningún componente
LL o NE__	La posición horizontal está limitada
__h_	La altura está limitada
___e	La elevación está limitada
LL o NEh_	La posición horizontal y la altura están limitadas
LL o NE_e
LL o NEhe	La posición horizontal, la altura y la elevación están limitadas
__he	La altura y la elevación están limitadas

Cuando se fija una componente de coordenada de un punto (2D, Altura, Elev) y el punto no tiene una coordenada de control de calidad, se actualiza la coordenada en la ventana de Propiedades con el mismo tipo de coordenadas que el de la vista de Coordenadas.

Vista de coordenada

Estos botones muestran las componentes de coordenadas horizontales de los puntos en el sistema de coordenadas seleccionado. Esta vista también muestra como se guardan las coordenadas editadas.

Cuadrícula − Seleccione este botón para mostrar puntos en la proyección cartográfica configurada en la ficha Sistema de coordenadas del diálogo Propiedades proyecto

Local − Seleccione este botón para mostrar puntos en coordenadas geográficas del datum del proyecto configurado en el diálogo Propiedades proyecto.

WGS − Seleccione este botón para mostrar puntos en coordenadas geográficas WGS-84.


    Fijo

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Estas casillas de verificación afirman o borran el estado fijo de las componentes de las coordenadas de los puntos.

Cuando cualquier componente de coordenada de un punto esté limitada, aparecerá una marca de verificación que estará borrada cuando la componente de coordenada no esté limitada. Las componentes de coordenadas pueden ser: 2D (horizontal), Altura (Elipsoide), y Elev (Elevación).

Están disponibles las siguientes opciones:

2D

Seleccione esta casilla de verificación para limitar el punto al Norte y al Este, o componentes de coordenada Latitud y Longitud.

Cuando se selecciona esta opción, el estado de fijación se muestra en la columna Fijo de la lista Puntos.

Altura

Seleccione esta casilla de verificación para limitar la altura del punto por encima o por debajo del elipsoide del proyecto.

Cuando se selecciona esta opción, el estado de fijación se muestra en la columna Fijo de la lista Puntos.

Elev

Seleccione esta casilla de verificación para limitar la elevación del punto. Esta opción sólo está disponible una vez que se hayan aplicado separaciones de geoide a las observaciones del proyecto. Este valor se muestra en unidades del proyecto. Cuando se selecciona esta opción, el estado de fijación se muestra en la columna Fijo de la lista Puntos.

NOTA: En el datum WGS-84, no fije más de una coordenada de cuadrícula. Para más información acerca de la limitación de las componentes de las coordenadas de los puntos, véase Ajuste de redes.


Diálogo Observaciones - Visión de conjunto
    Diálogo Observaciones − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

El diálogo de Observaciones contiene las fichas GPS, Terrestres y de Geoide. Utilice estas fichas para incluir o excluir observaciones GPS, terrestes y de geoide en el ajuste de la red, y para ver los residuales de observación del ajuste.

Para abrir el diálogo Observaciones:

  Seleccione Ajustes / Observaciones.

Puede inhabilitar las observaciones en las fichas Terrestres y fichas GPS. El inhabilitar una observación evita que ésta sea utilizada en ajustes y recálculos, además de impedir que aparezca en la lista de Observaciones.

Una vez que haya inhabilitado una observación, no va a poder rehabilitarla en el diálogo de Observaciones. Para más información, vea Inhabilitar Observaciones y Re-habilitar Observaciones Inhabilitadas.

En la ficha del Geoide, también puede cargar y descargar separaciones de geoide.

Estas opciones están disponibles en cada ficha:

Observaciones

Esta lista muestra observaciones GPS, terrestres o geoidales. La apariencia y contenido de la lista varía de acuerdo a las observaciones. Para más información sobre las columnas incluidas en cada lista, véase los siguientes temas:

  Observaciones (GPS)

  Observaciones (Terrestres)

  Observaciones (Geoide)

Filtro

Haga clic en Filtro para mostrar el diálogo Filtro de observaciones con las opciones para filtrar. Para más información, véase Filtración de observaciones.

Cargar (Ficha Geoide solamente)

Haga clic en Cargar para cargar las separaciones de geoide del modelo geoidal. Para que este botón esté disponible, un modelo geoidal debe seleccionarse en la ficha Sistema de coordenadas del diálogo Propiedades de proyecto.

Para interpolar la separación geoidal de una ubicación, se usan el modelo geoidal y las coordenadas horizontales de cada punto. Si se cargan separaciones geoidales, se obtiene la elevación para cada punto usando la altura observada del elipsoide, y la separación observada del geoide. Típicamente, las separaciones geoidales son cargadas después de producir coordenadas para cada punto usando un ajuste totalmente limitado utilizando el datum con el que se ha definido el modelo geoidal.

Para más información, véase Carga de separaciones geoidales.

Descargar (Ficha Geoide solamente)

Haga clic en Descargar para quitar las separaciones geoidales del proyecto. Para usar de nuevo estas separaciones en su proyecto, vuelva a cargar las separaciones utilizando el botón Cargar. Este botón solamente está disponible cuando la ficha Geoide está seleccionada.

Cuando no se haya seleccionado ningún modelo geoidal, o no se hayan cargado separaciones geoidales en el proyecto, este botón está inhabilitado en propiedades de proyecto.

Todas las observaciones de la lista Observaciones son eliminadas cuando las observaciones se borran del proyecto.

Para más información, véase Descarga de separaciones geoidales.


    Observaciones (GPS)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Use la lista de Observaciones en esta ficha para:

  incluir y excluir observaciones GPS

  ver residuales de observación

  inhabilitar observaciones

La lista sólo refleja las observaciones utilizadas en el ajuste de la red. Solamente puede editar la Columna Usar; las otras columnas son sólo para referencia.

SUGERENCIA: Puede filtrar observaciones en esta lista para mostrar cualquier combinación de observaciones RTK, cinemáticas, estáticas, o continuas. La filtración le permite ocultar temporalmente ciertas observaciones de modo que pueda encontrar otras en forma más expedita. Para más información, véase Filtración de observaciones.

Estas columnas están disponibles:

Columna	Lo que muestra
Usar	Seleccione o inhabilite las casillas de verificación en esta columna para incluir o excluir una observación en el ajuste de la red. Usela para identificar el estado actual de cada observación en la lista.    NOTA: Usted también puede hacer clic con el botón derecho del ratón en una observación, con el fin de mostrar un menú con un comando para inhabilitar la observación. Las observaciones inhabilitadas se quitan de la lista de observaciones y no pueden ser usadas en un ajuste hasta que hayan sido rehabilitadas. Las observaciones inhabilitadas no pueden rehabilitarse desde el diálogo Observaciones. Para más información, véase Rehabilitación de observaciones inhabilitadas.
Obs	Esta columna muestra el número de registro asignado a las observaciones. El número de registro precedido por la letra "B" denota un tipo de observación GPS.
Desde pto	Esta columna muestra el nombre del punto de inicio desde donde se llevan a cabo las observaciones.
Al Punto	Esta columna muestra el nombre del punto final de las observaciones.
Tipo	Esta columna enumera el método de medición usado para capturar la observación. Los valores posibles son RTK, Cinemático, Estático, y Continuo.
Grupo de varianza	Esta columna enumera el grupo de varianza, si existe, asociado con las observaciones.
Residual est. (máx)	Esta columna muestra el residual estandarizado calculado para la observación.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar las columnas en la lista.


Observations (Terrestrial)
Observaciones (Terrestres)

Más información

 Diálogo

Visión de Conjunto

Use la lista de Observaciones en esta ficha para:

  incluir o excluir observaciones terrestres

  ver residuales de observación

  inhabilitar observaciones

Solamente puede editar la columna Usar; todo el resto de las columnas son sólo para referencia.

CONSEJO: Puede filtrar las observaciones en esta lista para mostrar cualquier combinación de acimut, ángulo horizontal, distancia de elipsoide, elevación delta, u observaciones de elevación trigonométrica. El filtrar le permite ocultar temporalmente algunas observaciones de manera que pueda encontrar otras más fácilmente.

En el filtro de observaciones terrestres, seleccione todas las observaciones a menos que esté seguro de los tipos de las observaciones que desee seleccionar. Si selecciona una opción, ésta es la misma que si seleccionara una observación parcial.

Por ejemplo, si selecciona el filtro de distancia del elipsoide, sólo obtendrá observaciones que contengan un elipsoide de distancia. No verá observaciones con un ángulo horizontal ni distancia de elipsoide a menos que haya seleccionado las opciones de ángulo horizontal y filtro de distancia del elipsoide.

  Si selecciona la casilla de verificación de Acimut y deja en blanco las casillas de verificación para otras observaciones, entonces sólo las observaciones con acimutes tecleados serán mostrados.

  Si selecciona la casilla de verificación elevación Delta y deja en blanco las casillas de verificación para las otras observaciones, entonces se seleccionarán los datos de nivel.

  Si quiere ver observaciones brutas, verifique las opciones de ángulo horizontal, distancia de elipsoide, y elevaciones trigonométricas.

Las siguientes columnas están disponibles:

Columna	Lo que muestra
Usar	Seleccione esta casilla de verifiación para incluir una observación en (o excluir una observación de) un ajuste de la red y úsela para identificar el estado actual de cada observación en la lista. NOTA: Usted también puede hacer clic con el botón derecho del ratón en una observación, con el fin de mostrar un menú con un comando para inhabilitar la observación. Las observaciones inhabilitadas se quitan de la lista de observaciones y no pueden ser usadas en un ajuste hasta que hayan sido rehabilitadas. Las observaciones inhabilitadas no pueden rehabilitarse desde el diálogo Observaciones. Para más información, véase Rehabilitación de Observaciones Inhabilitadas.
Obs	Esta columna muestra el número de registro asignado a las observaciones. El número de registro precedido por la letra "T" denota un tipo de observación terrestre.
Punto de VR	El nombre del punto visual hacia la referencia.
Punto de Instr	El nombre del punto del instrumento.
Punto AD	El nombre del punto visual hacia adelante.
Grupo de Varianza	Esta columna enumera cualquier grupo de varianza asociado con las observaciones.
Residual est. (máx)	Esta columna muestra el residual estandarizado calculado para la observación.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar las columnas en la lista.

NOTA: La observaciones de nivel y de acimut se tratan como observaciones terrestres. Para estas observaciones, considere el punto de Instr como el punto "desde" y considere el Punto AD como el punto "hacia".


    Observaciones (Geoide)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Use la lista de Observaciones en esta ficha para ver observaciones geoidales. Solamente puede editar la columna Usar. Todo el resto de las columnas son sólo para referencia.

Las separaciones de geoide se calculan del actual modelo de geoide para todos los puntos en el ajuste.

Estas columnas están disponibles:

Columna	Lo que muestra
Usar	Seleccione esta casilla de verifiación para incluir una observación en (o excluir una observación de) un ajuste de la red. Véala para identificar el estado actual de las observaciones.
Obs	Esta columna muestra el número de registro asignado a las observaciones. El número de registro precedido por la letra "G" denota un tipo de observación de geoide.
Punto	El nombre del punto utiizado para generar la observación de geoide.
Separación	Es la diferencia entre la altura (elipsoide) y la elevación (geoide).
Error	Este es el error estándar para todas las observaciones de geoide. Esta se calcula cuando se cargan las observaciones de geoide. Para sobreescribir este error estándar, configure el mínimo error estándar en el diálgo de Estilos de Ajuste de Red.
Grupo de Varianza	Esta columna enumera cualquier grupo de varianza asociado con las observaciones. Las observaciones de geoide sólo listan el grupo de varianzas <Geoide por defecto> en esta columna.
Residual est.	Esta columna muestra el residual estandarizado calculado para la observación.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar las columnas en la lista.


Diálogo Filtro de observaciones - Visión de conjunto
    Diálogo Filtro de observaciones – Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice este diálogo para filtrar los tipos de observaciones que aparecen en la lista Observaciones disponibles.

Para ver el diálogo Filtro de observaciones:

  Haga clic en Filtrar en cualquier diálogo que contenga una lista de Observaciones disponibles.

Por defecto, todos los filtros están habilitados, lo que permite que se muestren todos los tipos de observaciones, ocultando los tipos de observaciones en la lista. Para inhabilitar filtros individuales, borre la marca de verificación pertinente. Están disponibles las siguientes opciones:

En el filtro de observaciones terrestres, deje todas las observaciones seleccionadas a menos que esté seguro de los tipos de observación que desee seleccionar. Si selecciona una opción, ésta es la misma que si seleccionara observaciones parciales. Por ejemplo, si selecciona el filtro de distancia del elipsoide, entonces sólo verá observaciones que contengan una distancia de elipsoide. No obtendrá observaciones con un ángulo horizontal y una distancia de elipsoide a menos que haya seleccionado ambas opciones de filtrado.

  Si selecciona una casilla de verificación de Acimut y borra todas las casillas para el resto de las observaciones, sólo se mostrarán observaciones con acimutes tecleados.

  Si selecciona la casilla de verificación de Elevación delta y borra todas las casillas para el resto de las observaciones, entonces los datos de nivel serán seleccionados.

  Si desea ver observaciones brutas; seleccione un ángulo horizontal, distancia de elipsoide, y elevación trigonométrica.


Diálogo Grupos de varianza - Visión de conjunto
    Diálogo Grupos de varianza − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

El diálogo Grupos de Varianza contiene las fichas GPS, Terrestre, y de Geoide. Utilice estas fichas para ver, crear, editar, y eliminar grupos de varianza de observaciones GPS  y observaciones terrestres, o ver el grupo de varianza por defecto de las separaciones de geoide.

Para acceder al diálogo Grupos de varianza:

  Seleccione Ajuste / Grupos de observaciones / Grupos de varianza.

Estarán disponibles las siguientes opciones en cada ficha:

Grupos

Utilice esta lista para hacer selecciones antes de editar o eliminar grupos de varianza. Conforme se van creando nuevos grupos de varianza se van añadiendo a esta lista.

Los grupos de varianza de observaciones GPS se muestran cuando se selecciona la ficha GPS, se muestran las observaciones terrestres cuando se selecciona la ficha Terrestres, y los grupos de varianza de observaciones de geoide se muestran cuando se selecciona la ficha Geoide.

NOTA: Inicialmente, el grupo <Geoide por defecto> no contiene ninguna observación. Las observaciones aparecen si en Propiedades proyecto se define un modelo geoidal y se cargan en el proyecto separaciones de geoide.

Nuevo

Seleccione este botón para crear un nuevo grupo de varianza para el proyecto.

Tras seleccionar este botón se muestra el diálogo Nuevo grupo de varianza con una opción para asignar un nombre al grupo de varianza. Cuando se hace clic en Aceptar para crear el nuevo grupo se muestra el diálogo Editar el grupo de varianza con opciones para añadir observaciones GPS o terrestres al grupo. Este botón no está disponible cuando se ve el grupo de varianza <Geoide por defecto>.

Editar

Seleccione este botón para editar un grupo de varianza existente seleccionado en la lista Grupos. El grupo seleccionado se carga en el diálogo Editar el grupo de varianza en el que se pueden añadir al grupo, o quitar de él, observaciones individuales.

Todos los grupos de varianza GPS y terrestres pueden editarse y el grupo de varianza de geoide sólo puede verse.

Eliminar

Seleccione este botón para eliminar el grupo de varianza seleccionado en la lista Grupos.

Tras seleccionar este botón aparece un mensaje con la petición de que se verifique la eliminación del grupo de varianza. Se puede elegir Aceptar para continuar o Cancelar para abandonar la acción.

NOTA: No se pueden eliminar los grupos de varianza <GPS por defecto>, <Terr. Por defecto>, o <Geoide por defecto>.

NOTA: Si tiene observaciones a lo largo de líneas muy cortas (<25 metros), Trimble le recomienda crear un grupo de varianza separado para estas observaciones de modo que se les asigne una escala separadamente del resto de las observaciones.


Diálogo Editar el grupo de varianza - Visión de conjunto
    Diálogo Editar el grupo de varianza − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también

Visión de conjunto

El diálogo Editar Grupo de Varianza contiene fichas GPS, Terrestres, y de Geoide. Use estas fichas para ver y editar grupos de varianza, observaciones GPS, observaciones terrestres, y separaciones de geoide. Para los  grupos de varianza, editar es el proceso de añadir y quitar observaciones.

Para ver el diálogo Editar el grupo de varianza:

1.	Para ver el diálogo Grupo de varianza, seleccione Ajuste / Grupos de observaciones / Grupos de varianza. Aparecerá el diálogo Grupo de varianza .

2.	Seleccione la ficha GPS, la ficha Terrestre, o la ficha Geoide.

3.	Seleccione el grupo deseado,

4.	Haga clic en Editar.

Aparecerá el diálogo Editar el grupo de varianza. Para más información, véase Editar el grupo de varianza.

En cada ficha, están disponibles las siguientes opciones:

Nombre del grupo

Vea este campo para conocer el nombre asignado al grupo de varianza. Este campo es sólo para referencia y no se puede editar.

Observaciones del grupo

Supervise esta lista para ver las observaciones en un grupo de varianza. Existen tres formas de esta lista: una aparece para las observaciones GPS, otra en observaciones terrestres, y la otra aparece para observaciones para las que existen separaciones de geoide. Para más información acerca de las columnas en cada lista, véanse estos temas:

  Observaciones del grupo (GPS)

  Observaciones del grupo  (terrestre)

  Observaciones del grupo (geoide)

Observaciones disponibles

Supervise esta lista para ver todas las observaciones GPS incluidas en el ajuste de la red. En esta lista se pueden seleccionar observaciones para añadirlas al grupo de varianza. Todos los campos son sólo para referencia y no se pueden editar.

  Observaciones disponibles (GPS)

  Observaciones disponibles (terrestrial)

  Observaciones disponibles (geoide)

NOTE: Al editar el grupo de varianza <Geoide por defecto> aparece la lista Observaciones, pero no está activa.

Añadir

Seleccione este botón para añadir observaciones a grupos de varianza. Este botón sólo está disponible cuando se selecciona una observación en la lista Observaciones disponibles. La observación seleccionada se añade a la lista Observaciones de grupo. Para más información, véase Añadir observaciones.

Quitar

Seleccione este botón para quitar una observación de un grupo de varianza. Este botón sólo está disponible cuando se selecciona una observación en la lista Observaciones del  grupo. Este botón sólo está disponible cuando se editan grupos de varianza definidos por usuario, pero no con los grupos de varianza por defecto. Para más información, véase Quitar observaciones.

Filtrar

Seleccione este botón para filtrar observaciones en la lista Observaciones disponibles.

Se presentará el diálogo Filtro de observaciones con opciones para filtrar observaciones en la lista. En el diálogo Editar Grupo de Varianza para observaciones GPS, puede mostrar u ocultar cualquier combinación de tipos de observación RTK, Cinemático, Estático, y Continuo seleccionando las opciones en el diálogo. En el diálogo Editar Grupo de Varianza para observaciones terrestres, puede mostrar u ocultar cualquier combinación de Acimut, Angulo Horizontal, distancia de Elipsoide, Elevación Delta, u Observaciones Trigonométricas.

Para más información, véase Filtrar observaciones.


Observaciones de grupo (Grupo de varianza - GPS)
    Observaciones de grupo (Grupo de varianza − GPS)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Vea las observaciones en un grupo de varianza mediante esta lista. Esta forma de la lista sólo aparece para grupos de varianza de observaciones GPS.

En esta lista se pueden añadir y quitar observaciones. Todos los campos son sólo para referencia y no se pueden editar. Cuando en esta lista hay una observación resaltada está disponible el botón Quitar para quitar observaciones de la lista. Para más información, véase Añadir observaciones y Quitar observaciones.

Están disponibles las siguientes columnas:

Columna	Lo qué muestra
Obs	Esta columna muestra el número de registro asignado a la observación en el proyecto.
Desde punto	Esta columna muestra el punto inicial de la observación.
Al punto	Esta columna muestra el punto final de la observación
Tipo	Esta columna muestra el método utilizado para recolectar la observación. Los valores posibles son: Estático, Cinemático, RTK, y Continuo

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


Observaciones disponibles (Grupo de varianza - GPS)
    Observaciones disponibles (Grupo de varianza − GPS)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice esta lista para ver todas las observaciones GPS que fueron incluidas en el ajuste de la red. En esta lista se pueden seleccionar observaciones para añadirlas al grupo de varianza. Todos los campos son sólo para referencia y no se pueden editar.

Cada fila de la lista representa información de grupo de varianza para una observación. Utilice la lista como fuente para añadir observaciones al grupo de varianza. Cuando se selecciona una observación en la lista, se hace disponible el botón Añadir para añadir observaciones a la lista Observaciones del grupo.

SUGERENCIA: Puede usar el botón de Filtro para mostrar cualquier combinación de observaciones RTK, Cinemático, Estático, y Continuo. El filtrado temporalmente oculta algunas observaciones a fin de que sea más fácil ver otras. Para más información, véase Filtrar observaciones.

Están disponibles las siguientes columnas:

Columna	Lo qué muestra
Obs	Esta columna muestra el número de registro asignado a la observación en el proyecto.
Desde pto	Esta columna muestra el punto inicial de la observación.
Al punto	Esta columna muestra el punto final de la observación.
Tipo	Esta columna muestra el método topográfico GPS utilizado para recolectar la observación. Los valores posibles son: Estático, Cinemático, RTK, y Continuo.
Grupo de Varianza	Esta columna permite saber si una observación está asignada a un grupo de varianza.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


Observaciones de grupo (Grupo de varianza - Geoide)
    Observaciones de grupo (Grupo de varianza − Geoide)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Cada fila de la lista es el registro de una observación almacenado en el proyecto. No puede editar estos campos.

Aparecerán las siguientes columnas:

Columna	Lo qué muestra
Obs	Esta columna muestra el número de registro de los datos de la observación almacenados en el proyecto.
Punto	Esta columna muestra el nombre del punto cuyas coordenadas fueron utilizadas para extraer del modelo las observaciones de geoide.
Separación	Esta columna muestra la altura de la observación de geoide deducida del modelo geoidal definido en propiedades proyecto.
Error	Esta columna muestra error estimado en la separación de geoide.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


    Observaciones disponibles (Grupo de varianza - Geoide)

Más Información

 Véase también

Visión de Conjunto

La lista Observaciones disponibles está inhabilitada y no se utiliza.


    Diálogo Nuevo grupo de varianza

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice este diálogo para crear un nuevo grupo de varianza .

NOTA: Este botón no está disponible cuando se selecciona la ficha Geoide. Dado que el mismo método se utiliza para interpolar para cada observación de geoide procedente del mismo modelo geoidal, no es necesario separarlas en múltiples grupos.

Para ver el diálogo Nuevo grupo de varianza:

1.	Para ver el diálogo Grupo de varianza, seleccione Ajuste / Grupos de observaciones / Grupos de varianza. Aparecerá el diálogo Grupos de varianza.

2.	Seleccione la ficha GPS o la ficha Terrestre

3.	Haga clic en Nuevo.

Aparecerá el diálogo Nuevo grupo de varianza.

Estarán disponibles las siguientes opciones:

Nombre

Inscriba en este campo el nombre del grupo de varianza. Los nombres de los grupos de varianza pueden contener hasta 24 caracteres, pero los nombres descriptivos más pequeños son más fáciles de encontrar en la lista Grupos.

Tras asignar un nombre al nuevo grupo de varianza y hacer clic en Aceptar se mostrará el diálogo Editar el grupo de varianza con opciones para añadir y quitar observaciones del grupo de varianza. Para más información, véase Crear grupos de varianza.


Observaciones de Grupo (Grupo Varianza -  Terrestre)

Visión de Conjunto

En esta lista de Grupos, puede ver sus observaciones en un grupo de varianza. Esta forma de la lista sólo aparece para grupos de varianza en observaciones terrestres.

CONSEJO: Puede agregar o quitar observaciones de o desde esta lista. (El botón Quitar está disponible cuando una observación está resaltada en la lista.) Sin embargo, no puede editar cualquier campo. Para más información, vea Agregar Observaciones y Quitar Observaciones.

Estas columnas están disponibles:

Columna	Lo qué muestra
Obs	Esta columna muestra el número de registro asignado a la observación en el proyecto
Punto REF	Esta columna muestra el nombre del punto visual hacia la referencia de la observación.
Punto Instr.	Esta columna muestra el nombre del punto instrumental de la observación.
Punto AD	Esta columna muestra el nombre del punto de la observación hacia adelante.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.

NOTA: Las observaciones de Nivel y de acimut se toman como observaciones terrestres. Para estas observaciones, considere el punto instr como el punto "desde" y el Punto AD como el punto "a".

NOTA: Cuando crea un grupo de varianza terrestre, un grupo a parte es creado para cada tipo de observación. Por ejemplo, si crea un grupo de varianza terrestre que contiene un ángulo vertical y observaciones de distancia, un grupo de varianza terrestre es creado para las observaciones angulares y un grupo de varianza terrestre es creado para las observaciones de distancia. Esto también ocurre para el grupo de varianza <Terr. Por defecto>.


Observaciones Disponibles (Grupo Varianza - Terrestre)

Visión de Conjunto

En esta lista de grupos, puede ver todas las observaciones terrestres que fueron incluidas en su ajuste de red. Cada fila representa la información de grupo de varianza para una observación. Puede seleccionar observaciones de la lista y agregarlas al grupo de varianza. Sin embargo, no puede editar los campos.

Cuando se selecciona una observación en la lista, el botón Agregar queda disponible para agregar observaciones a la lista del  Grupo de Observaciones.

CONSEJO: Puede usar el botón Filtrar para filtrar observaciones y mostrar cualquier combinación de acimut, ángulo horizontal, distancia de elipsoide, elevación delta, y elevación trigonométrica. El filtrar oculta temporalmente algunas observaciones para facilitar ver otras observaciones. Para más información, vea Filtrar Observaciones.

Estas columnas están disponibles:

Columna	Lo qué muestra
Obs	Esta columna muestra el número de registro asignado a la observación en el proyecto.
Punto REF	Esta columna muestra el nombre del punto visual hacia la referencia de la observación.
Punto Instr.	Esta columna muestra el nombre del punto instrumental de la observación.
Punto AD	Esta columna muestra el nombre del punto de la observación hacia adelante.
Grupo de Varianza	Muestra el grupo de varianza si se asigna una observación a un grupo de varianza.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


Diálogo Grupos de transformación - Visión de conjunto
    Diálogo Grupos de transformación − Visión de conjunto

Más información

Cómo...	Diálogo	Véase también
Visión de conjunto

Utilice el diálogo Grupos de Transformación para crear, editar, y eliminar los grupos de  transformación para el ajuste de la red. Este diálogo contiene las fichas GPS, Terrestre, y de Geoide. Utilice estas fichas para ver o seleccionar grupos de transformación de observaciones GPS, observaciones terrestres, observaciones de geoide.

Para acceder al diálogo Grupos de transformación:

  Seleccione Ajuste / Grupos de observación / Grupos de transformación.

Están disponibles las siguientes opciones en cada ficha:

Grupos

Utilice esta lista para seleccionar un grupo de transformación de observaciones GPS, terrestres, o de geoide.

Cuando se selecciona la ficha GPS, la ficha terrestres, o la ficha de Geoide cambia el contenido de la lista Grupos.

Se crean automáticamente tres grupos de transformación por defecto (el grupo <GPS por defecto>, el grupo <Terr. por defecto>, y el grupo <Geoide por defecto>). El grupo <Geoide por defecto> puede estar vacío o puede contener todas las observaciones para las que existan separaciones de geoide.

NOTA: El grupo <Geoide por defecto> estará vacío si en el proyecto no se ha definido ningún modelo geoidal o si no se han cargado en el proyecto las separaciones de geoide. Para información acerca de la definición de un modelo geoidal para un proyecto, véase Sistema de coordenadas. Para información acerca de cómo cargar separaciones de geoide para su ajuste desde un modelo geoidal, véase Observaciones.

Se facilita una ficha con una lista para seleccionar grupos de transformación GPS, terrestres, o de geoide. La ficha GPS lista el grupo <GPS por defecto>, más otros grupos GPS cualesquiera creados para el proyecto, definidos por usuario. La ficha Terrestre lista el grupo <Terr. por defecto>, y cualquier otro grupo terrestre definido por el usuario creado para el proyecto. La ficha geoide lista sólo el grupo <Geoide por defecto>;no se pueden crear grupos de geoide nuevos.

Tras seleccionar un grupo de la lista se puede seleccionar uno de los botones disponibles para edita o eliminar el grupo de transformación, si procede.

Nuevo

Utilice este botón para crear un nuevo grupo de transformación. Este botón no está disponible para grupos de transformación de geoide.

NOTA: Los grupos <GPS por defecto>, <Terr. por defecto>,  y <Geoide por defecto> no se pueden eliminar nunca. El grupo de transformación <Geoide por defecto> es el único grupo de transformación de geoide. No son necesarios múltiples grupos de transformación de geoide porque las observaciones de geoide proceden de una sola fuente, el modelo geoidal. Para el grupo <Geoide por defecto> sólo pueden editarse los parámetros de transformación.

Para más información, véase Crear grupos de transformación.

Editar

Utilice este botón para ver o editar grupos de transformación GPS, terrestres o de geoide. Este botón está siempre disponible cuando se muestran las listas de grupos GPS, terrestres o de geoide.

Tras seleccionar este botón aparecerá el diálogo Editar grupo de transformación, con opciones para añadir o quitar observaciones del grupo (sólo GPS y terrestres) y editar los parámetros de transformación.

Para más información, véase Editar grupos de transformación.

Eliminar

Utilice este botón para eliminar grupos de transformación GPS o terrestres seleccionados. Los grupos <GPS por defecto>, <Terr. por defecto>, y <Geoide por defecto> no se pueden eliminar nunca del proyecto. Sólo se pueden eliminar los grupos de transformación GPS o terrestres definidos por usuario.

NOTA: Puesto que no se puede eliminar el grupo <Geoide por defecto> y no se pueden crear nuevos grupos de transformación de geoide, este botón nunca está disponible cuando se seleccionan grupos de transformación de geoide.

Para más información, véase Eliminar grupos de transformación.


    Diálogo Nuevos grupos de transformación

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice el diálogo Nuevos grupos de transformación para crear un nuevo grupo de transformación GPS o terrestre.

NOTA: Este botón no está disponible cuando se selecciona la ficha Geoide. Puesto que el mismo método se utiliza para interpolar cada observación de geoide del mismo modelo de geoide, no es necesario separarlos en múltiples grupos.

Para acceder al diálogo:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	Seleccione la ficha GPS o la ficha Terrestre.

3.	Haga clic en Nuevo.

Aparecerá el diálogo Nuevo grupo de transformación.

Estará disponible la siguiente opción:

Nombre

Inscriba en este campo el nombre del grupo de transformación. Los nombres de los grupos de transformación pueden contener hasta 24 caracteres, pero los nombres descriptivos más pequeños son más fáciles de encontrar en la lista Grupos.

Tras asignar un nombre al nuevo grupo de transformación y hacer clic en Aceptar se mostrará el diálogo Editar grupo de transformación con opciones para añadir y quitar observaciones del grupo de transformación y definir los parámetros de transformación. Para más información, véase Crear grupos de transformación.


Diálogo Editar grupos de transformación - Visión de conjunto
    Diálogo Editar grupos de transformación − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Utilice el diálogo Editar Grupos de Transformación para ver, editar, y verificar grupos de transformación de observaciones GPS, terrestres, o de geoide.

Para acceder a este diálogo:

1.	Seleccione Ajuste / Grupos de observación / Grupos de transformación. Aparecerá el diálogo Grupos de transformación.

2.	En las fichas GPS, Terrestres, o Geoide, seleccione el grupo deseado.

3.	Haga clic en Editar.

Aparecerá el diálogo Editar grupo de transformación. Para más información, véase Editar grupos de transformación.

Para grupos de transformación GPS y terrestres, editar es el proceso de añadir o quitar observaciones incluidas en el ajuste de la red o del grupo y definir los parámetros de transformación. Puesto que los grupos de transformación de geoide contienen todas las observaciones habilitadas en el ajuste de la red para las que existen separaciones del modelo geoidal, editar se limita a definir los parámetros de transformación.

NOTA: El grupo <Geoide por defecto> estará vacío si en el proyecto no se ha definido ningún modelo geoidal o si no se han cargado en el proyecto las separaciones del geoide. Para obtener información acerca de la definición de un modelo geoidal para un proyecto, véase Sistema de coordenadas. Para obtener información acerca de cargar separaciones de geoide desde un modelo geoidal, véase Observaciones.

Se puede definir o calcular cualquier combinación de parámetros de transformación para aplicar transformaciones a las observaciones en un grupo de transformación. Se pueden crear múltiples grupos de transformación GPS o terrestres y a cada uno de estos grupos se pueden aplicar diferentes conjuntos de parámetros de transformación.

CUIDADO: La aplicación inadecuada de una transformación podría causar efectos adversos al ajuste. Antes de intentar aplicar transformaciones a un grupo de observaciones deben verificarse todos los parámetros de transformación.

Están disponibles las siguientes opciones:

Nombre del grupo

Este campo muestra el nombre asignado al grupo de transformación. Este campo sólo sirve como referencia y no puede ser editado.

Lista de parámetros de transformación

Utilice esta lista para definir, calcular, o excluir parámetros de transformación.

Se pueden definir o calcular los siguientes parámetros:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura

Cada definición de parámetro comprende un campo Valor y una lista Estado. Para obtener información adicional, véanse los siguientes temas:

  Valor

  Estado

Por defecto, estos parámetros de transformación se configuran en calculados para grupos de transformación de observaciones GPS:

   Deflección de Longitud

   Deflección de Latitud

   Rotación de Acimut

   Escala de la Red

Por defecto, sólo la rotación de acimut se configura a observaciones terrestres calculadas. Se pueden configurar otros parámetros a calculados o definidos por el usuario, pero sólo se usan cuando existe un error sistemático en las observaciones. Por ejemplo, si se ejecuta un ajuste y todas las distancias (medidas a través de técnicas terrestres) tienen un residual de +3 ppm, no se puede calcular un parámetro de escala de distancia por que obivamente ocurrió un error sistemático durante la toma de datos. Este error sistemático pudo haber ocurrido por que no se aplicó la configuración de ppm en el EDM.

NOTA: No se usan  los parámetros de rotación de acimut, escala de red, escala de distancia,  y constante de distancia para transformaciones de geoide.

Para conocer las normas básicas para la definición de parámetros de transformación individuales o de conjuntos de parámetros, véase Parámetros de transformación. Para obtener información más avanzada acerca de las técnicas y prácticas para la transformación de datos de observación, véase Bibliografía.

Observaciones del grupo

Esta lista muestra las observaciones GPS, terrestres, o geoide incluidas en un grupo de transformación. Pueden aparecer diferentes variaciones de esta lista, dependiendo del tipo de observación.

Para más información, véanse los siguientes temas:

  Observaciones del grupo (GPS)

  Observaciones del grupo  (terrestre)

  Observaciones del grupo (geoide)

Observaciones disponibles

Utilice esta lista para ver todas las observaciones en el ajuste de la red y la fuente para añadir observaciones a un grupo de transformación. Todos los campos tienen fines de presentación y no están disponibles para edición.

Para más información acerca de los campos en estas listas, véanse los siguientes temas:

  Observaciones disponibles (GPS)

  Observaciones disponibles (terrestres)

  Observaciones disponibles (geoide)

NOTA: Cuando se edita el grupo de transformación <GPS por defecto>, <Terr. por defecto>, o <Geoide por defecto >, la lista Observaciones disponibles aparece, pero no está activa. De los grupos de transformación GPS, terrestres, o geoide no se puede quitar una observación.

Añadir

Utilice este botón para añadir observaciones a la lista Observaciones del grupo. Este botón sólo está disponible cuando se selecciona una observación en la lista Observaciones disponibles.

Quitar

Utilice este botón para quitar observaciones de la lista Observaciones del grupo.

Filtro

Utilice este botón para mostrar el diálogo Filtro de observaciones con opciones para filtrar los tipos de observaciones en la lista Observaciones disponibles.


    Valor (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice los campos en la segunda columna de la Lista de parámetros de transformación para ver o cambiar el valor aplicado a cada parámetro de transformación.

Este campo especifica los valores del parámetro de transformación, y la opción seleccionada en la lista Estado determina cómo ese valor es generado o no generado.

Las normas para cambiar el valor y el estado de parámetros individuales figuran en los siguientes temas:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura


    Estado (Parámetro de transformación)

Más información

Diálogo	Véase también
Visión de Conjunto

Utilice estos campos en la tercera columna de la Lista de parámetros de transformación para seleccionar el método utilizado para determinar un valor de parámetro de transformación.

Están disponibles las siguientes opciones:

Calculadas

Utilice esta opción para permitir que el software Trimble Geomatics Office calcule el parámetro de transformación Valor como parte del ajuste. El valor para cada parámetro de la lista se calcula cuando se incluyen en el ajuste suficientes limitaciones de puntos fijos a las componentes de las coordenadas. Para más información acerca de la limitación coordenadas, véase Puntos.

Definidas por el usuario

Utilice esta opción para introducir un valor del parámetro de transformación definido por el usuario. Si se conoce un valor del parámetro, esta opción se selecciona como estado y el valor conocido se introduce en el campo Valor asociado.

CUIDADO: Tenga cuidado al aplicar esta configuración al estado del parámetro y al introducir valores del parámetro definido por usuario. Para conocer la normas generales a aplicar a la definición del valor y estado de parámetros individuales, véase Parámetros de transformación.

Sin usar

Utilice esta opción para inhabilitar el valor de un parámetro de transformación. Si se introduce un valor en el campo Valor, esta opción inhabilita el valor. Un valor de parámetro inhabilitado no se usa en cálculos ni se aplica a las observaciones en el grupo de transformación. Esta es la configuración por defecto para todos los parámetros.

CUIDADO: Tenga cuidado al seleccionar la opción Estado para el valor de un parámetro de transformación. La aplicación inadecuada de una transformación podría causar efectos adversos al ajuste.

Las normas para seleccionar la opción Estado de parámetros individuales figuran en los siguientes temas:

  Desvío en longitud

  Desvío en latitud

  Rotación de acimut

  Escala de la red

  Escala de distancia

  Constante de distancia

  Constante de altura


    Desvío en longitud (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice el campo Valor y la lista Estado para ver, verificar, o introducir la inclinación en el Horizonte geodésico local en la dirección Este-Oeste, expresada en segundos de arco.

El desvío de longitud es un ángulo de rotación usado para la transformación de datum y a veces (observaciones terrestres) para calcular una corrección de Laplace para los acimutes astronómicos observados. Si utiliza este ángulo de rotación, necesita tres alturas (elevación y/o elipsoide) que están fijas en posiciones horizontales conocidas (no necesariamente fijas) en la red. El ángulo afecta observaciones angulares y líneales, horizontales (excepto para elevaciones delta), y verticales; y corresponde a una de las componentes para la deflección de la vertical.

Para más información, véase Definir parámetros de transformación.


    Desvío en latitud (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice el campo Valor y la lista Estado para ver, verificar, o definir la inclinación en el Horizonte geodésico local en la dirección norte-sur, expresada en segundos de arco.

El desvío en latitud es uno de los ángulos de rotación para una transformación de datum utilizada en la transformación de observaciones desde un datum a otro. Si usa este ángulo de rotación, entonces necesita tres alturas (elevación y/o elipsoide) que están fijas en posiciones horizontales conocidas (no necesariamente conocidas) en la red. El ángulo afecta observaciones angulares y líneales, horizontales (excepto para elevaciones delta), y verticales; y corresponde a una de las componentes para la deflección de la vertical.

Para más información, véase Definir parámetros de transformación.


    Rotación de acimut (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice el campo Valor y la lista Estado para ver, verificar, calcular, o introducir el ángulo de rotación del sistema de coordenadas alrededor de la normal en cada punto (en este caso, la normal es una línea perpendicular al elipsoide en ese punto) para explicar la rotación del datum del ajuste al datum de la observación, expresado en segundos de arco. La rotación de acimut se usa para transformaciones de datum y afecta sólo a los acimutes tecleados.

El cálculo de la Rotación de acimut requiere dos puntos horizontales fijos para observaciones GPS. Las observaciones Terrestres, por defecto, se rotan para ajustar los acimutes GPS.

Por defecto, sólo se calcula la rotación de acimut para observaciones terrestres. Se pueden configurar otros parámetros a definidos por el usuario o calculados, pero sólo se usan cuando existe un error sistemático en las observaciones. Por ejemplo, si se ejecuta un ajuste y todas las distancias, (medidas a través de distintas técnicas terrestres) tienen un residual de +3ppm, un parámetro de escala de distancia puede calcularse porque obviamente ocurrió un error sistemático durante la toma de datos.

NOTA: El parámetro rotación de acimut no se utiliza para transformaciones de geoide.

NOTA: La rotación sólo se aplica a las observaciones en el ajuste. Por ejemplo, las observaciones de tomas aisladas, que no están incluidas en el ajuste, no serán rotadas.

Para más información, véase Definir parámetros de transformación.


    Escala de la red (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice el campo Valor y la lista Estado para ver, verificar, o introducir un multiplicador de escala de la red que aplicar a cada observación lineal en el ajuste. La escala de la red se utiliza para la transformación de un conjunto de observaciones de un datum a otro.

El cálculo de la escala de la red para observaciones GPS requiere dos puntos horizontales fijos y un punto vertical fijo.

El calcular una Escala de Red para observaciones Terrestres requiere dos puntos fijos horizontales o puntos verticales.

La escala de la red se aplica a todas las observaciones GPS lineales en el grupo de transformación.

NOTA: El parámetro Escala de la red no se utiliza para las transformaciones de geoide.

Para más información, véase Definir parámetros de transformación.


    Escala de distancia (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de conjunto

Utilice los campos Valor y Estado para ver, verificar, o introducir el multiplicador de la escala de distancia aplicado a cada observación de distancia en el grupo parámetro.

La escala de distancia se utiliza algunas veces para transformaciones de datum y otras veces para corregir errores sistemáticos en las observaciones. Para definir este parámetro se requieren dos puntos horizontales fijos.

NOTA: El parámetro Escala de distancia no se utiliza para transformaciones de geoide.

Para más información, véase Definir parámetros de transformación.


    Constante de distancia (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de conjunto

Utilice los campos Valor y Estado para ver, verificar, o intoducir un valor constante de distancia, en unidades del proyecto, para cada observación de distancia en el grupo de parámetros GPS. Este parámetro corrige los errores sistemáticos de distancia en las observaciones. Para definir este parámetro se requieren dos puntos horizontales fijos.

NOTE: El parámetro Constante de distancia no se utiliza para transformaciones de geoide.

Para más información, véase Definir parámetros de transformación.


    Constante de altura (Parámetro de transformación)

Más información

Cómo...	Diálogo	Véase también
Visión de conjunto

Utilice los campos Valor y Estado para ver, verificar, calcular, o introducir un valor constante de altura para añadir a cada observación vertical en el grupo de transformación. La constante de altura se utililza para corregir errores sistemáticos en las observaciones, y para transformar modelos de geoide. Este valor de parámetro requiere una elevación y una altura.

Este parámetro corrige los errores sistemáticos en las observaciones verticales y se utiliza para transformar modelos geoidales.

Para más información, véase Definir parámetros de transformación.


Observaciones del grupo (Grupo de transformación - GPS)
    Observaciones del grupo (Grupo de transformación − GPS)

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Utilice esta lista para ver grupos de transformación GPS y añadir o quitar observaciones del grupo de transformación GPS. No puede editar los campos.

Estas columnas están disponibles:

Columna	Lo que muestra
Obs	Este campo muestra el número asignado a la observación. Los números de las observaciones GPS van precedidos por la letra "B".
Desde pto	Este campo muestra el punto inicial de la observación.
Al punto	Este campo muestra el punto final de la observación.
Tipo	Este campo muestra el método topográfico utilizado para recolectar la observación.

CONSEJO: Puede mover, cambiar el tamaño, y ordenar las columnas.


Observaciones disponibles (Grupo de transformación - GPS)
    Observaciones disponibles (Grupo de transformación − GPS)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice esta lista para ver todas las observaciones habilitadas en el ajuste de la red y como fuente para añadir observaciones a un grupo de transformación GPS. Todos los campos tienen fines de presentación y no están disponibles para edición.

Cuando se cargan inicialmente datos en un proyecto, todas las observaciones habilitadas se añaden al grupo <GPS por defecto>. Las observaciones se pueden mover a grupos de transformación definidos por el usuario. Sin embargo, cada observación sólo puede estar en un grupo definido por el usuario.

En esta lista se pueden seleccionar cualquier número de observaciones para ser añadidas al grupo de transformación actual. Esto incluye a las observaciones asignadas a otros grupos de transformación definidos por usuario. Cuando se añade al grupo actual una observación que pertenece a otro grupo definido por usuario, se le quita del otro grupo.

SUGERENCIA: Las observaciones recolectadas utilizando uno o más métodos topográficos pueden ser filtradas. Las observaciones filtradas se ocultan temporalmente, lo que hace que la lista sea más pequeña. Cuanto menor sea el tamaño de la lista, más fácil resultará encontrar las observaciones. Utilice el campo Tipo para conocer el método topográfico utilizado para recolectar las observaciones. Para más información, véase Filtro de observaciones.

NOTA: La lista no refleja todas las observaciones en el proyecto, sólo las observaciones utilizadas en el ajuste de la red.

Están disponibles las siguientes columnas:

Columna	Lo que muestra
Obs	Esta columna muestra el número ID asignado a observación. Los números de las observaciones GPS van precedidos por la letra "B".
Deste pto	Esta columna muestra el nombre del punto inicial de la observación.
A pto	Esta columna muestra el nombre del punto final de la observación.
Tipo	Esta columna muestra el método topográfico utilizado para recolectar la observación. Los cuatro valores posibles son: RTK, Cinemático, Estático, y Continuo.
Grupo de Transformación	Esta columna permite conocer si la observación es asignada a un grupo de transformación.

CONSEJO: Puede mover, cambiar el tamaño, y ordenar las columnas.


Observaciones del grupo (Grupo de transformación - Geoide)
    Observaciones del grupo (Grupo de transformación − Geoide)

Más Información

 Véase también

Visión de Conjunto

Utilice esta lista para ver el grupo de transformación <Geoide por defecto>. Todos los campos tienen fines de presentación únicamente y no se pueden editar.

Cuando en el ajuste de la red se cargan separaciones de geoide, todas las observaciones de geoide utilizadas en el ajuste de la red se cargan automáticamente en esta lista.

Las observaciones del geoide no se pueden eliminar de esta lista. La única forma de quitar una observación de esta lista consiste en inhabilitar la observación para impedir así su utilización en el curso del proyecto.

SUGERENCIA: Puede mover, cambiar el tamaño, y ordenar las columnas.

Estas columnas están disponibles:

Columna	Lo que muestra
Obs	Este campo muestra el número ID asignado a la observación. Los números de las observaciones de geoide van precedidos por la letra "G".
Punto	Este campo muestra el nombre del punto cuyas coordenadas se utilizaron para extraer del modelo las observaciones de geoide.
Separación	Este campo muestra la separación del geoide entre el elipsoide WGS-84 y el nivel medio del mar.
Error	Este campo muestra el error estimado en la observación del geoide.

NOTA: El error estimado inicial de las separaciones de geoide es el error del conjunto de observaciones. El software Trimble Geomatics Office calcula las medias de todas las separaciones de geoide en el ajuste y luego determina el error típico de las separaciones. Este es sólo un punto de arranque y tal vez sea necesario escalar las observaciones para conseguir una verdadera representación de los errores estimados.

NOTA: Puede cambiar el error estándar (típico) aumentando el error estándar mínimo para las separaciones de geoide en el diálogo de Estilos de Ajustes de Red.


Observaciones disponibles (Grupo de transformación - Geoide)
    Observaciones disponibles (Grupo de transformación − Geoide)

Más Información

 Véase también

Visión de conjunto

La lista Observaciones disponibles está inhabilitada y no se utiliza.


Observaciones de Grupo (Grupo de Transformación -Terrestre)

Visión de conjunto

Utilice esta lista para ver grupos de transformación  terrestres y para agregar o quitar observaciones en grupos de transformación terrestre. No puede editar la información en esta lista.

Estas columnas están disponibles:

Columna	Lo que muestra
Obs	Este campo muestra el número ID asignado a la observación. Los números de las observaciones terrestres van precedidos por la letra "T". La letra "L" precede a las observaciones de nivel.
Punto REF	Esta columna muestra el nombre del punto visual hacia la referencia de la observación.
Punto Instr.	Esta columna muestra el nombre del punto instrumental de la observación.
Punto AD	Esta columna muestra el nombre del punto de la observación hacia adelante.

CONSEJO: Puede cambiar el tamaño, mover, y ordenar las columnas.

 NOTA: Las observaciones de nivel y acimut se tratan como observaciones terrestres. Para estas observaciones, considere el punto de Instr. como el punto "desde" y el punto AD como el punto "a".


Observaciones Disponibles (Grupo de Transformación -Terrestre)

Visión de Conjunto

Esta lista muestra las observaciones utilizadas en el ajuste de la red. Utilícela para ver todas las  observaciones habilitadas en el ajuste de red. También la puede utilizar como una fuente para agregar observaciones a un grupo de transformación terrestre. No puede editar la información en esta lista.

Cuando los datos se cargan inicialmente en el proyecto, todas las observaciones habilitadas se agregan al grupo <Terr. por defecto>. A medida que se van creando grupos de transformación definidos por el usuario, las observaciones se van quitando del grupo <Terr. por defecto>.

Puede seleccionar cualquier observación de la lista de Observaciones Disponibles y las puede agregar al grupo de transformación actual. Este incluye observaciones asignadas a otros grupos de transformación definidos por el usuario. (Cuando hace esto, la observación es quitada del otro grupo.)

CONSEJO: Se pueden filtrar las observaciones tomadas usando métodos diferentes, por ejemplo, elevaciones delta. Las observaciones filtradas se ocultan temporalmente haciendo la lista más pequeña. Esto facilita el encontrar observaciones. Para más información, vea Filtrar Observaciones.

Estas columnas están disponibles:

Columna	Lo que muestra
Obs	Este campo muestra el número asignado a la observación. Los números de las observaciones terrestres van precedidos por la letra "T". La letra "L" precede a las observaciones de nivel.
Punto REF	Esta columna muestra el nombre del punto visual hacia la referencia de la observación.
Punto Instr.	Esta columna muestra el nombre del punto instrumental de la observación.
Punto AD	Esta columna muestra el nombre del punto de la observación hacia adelante.
Grupo de Transformación	Esta columna le indica si la observación está asignada a un grupo de transformación.

CONSEJO: Puede cambiar el tamaño, mover, y ordenar las columnas.

NOTA: Las observaciones de nivel y acimut se tratan como observaciones terrestres. Para estas observaciones, considere el punto de Instr. como el punto "desde" y el punto AD como el punto "a".


Diálogo Estrategias de ponderación - Visión de conjunto
    Diálogo Estrategias de ponderación − Visión de conjunto

Más información

Cómo...	Diálogo	Véase también
Visión de conjunto

El diálogo Estrategias de Ponderación permite definir y aplicar estrategias de ponderación a observaciones GPS, observaciones terrestres, observaciones de geoide, y Grupos de varianza.

Para acceder a él:

  Seleccione Ajuste / Estrategias de ponderación.

El diálogo Estrategias de Ponderación contiene las fichas GPS, Terrestres, y de Geoide. Cada una contiene una lista de Observaciones en la que puede ver las observaciones incluidas en un ajuste de red. Seleccione la ficha apropiada para ver todas las observaciones GPS, observaciones terrestres, o todos los puntos para los cuales existen separaciones de geoide.

Cada ficha contiene las siguientes opciones:

Aplicar escalares a

Seleccione uno de estas opociones para definir el método utilizado para aplicar estrategias de ponderación a grupos de observaciones o grupos de varianza.

Tipo de escalar

Seleccione uno de estas opciones para aplicar un escalar a los errores estimados, utilizando el método seleccionado en el grupo Aplicar escalares a. Para más información, véase Tipo de escalar.

Valor escalar

Esta campo está habilitado solamente cuando se selecciona la opción definido por el usuario en el grupo de Tipo de escalar. Introduzca un valor en este campo para definir y aplicar el valor escalar.

Cuando se hace clic en Bloquear se inserta en este campo el escalar del ajuste en curso.

CUIDADO: Ejerza un cuidado extremo al editar este campo. Para conocer las normas acerca de la evaluación de los resultados de las estrategias de ponderación, véanse las estadísticas del informe Estrategias de ponderación.

Observaciones

Supervise esta lista para ver el escalar para todas las observaciones GPS, observaciones terrestres, o para las observaciones para las que existen separaciones de geoide. La apariencia y el contenido de esta lista cambia cuando se selecciona la ficha GPS, la ficha Terrestre, o la ficha Geoide. Para más información, véanse estos temas:

  Observaciones (GPS)

  Observaciones (Terrestres)

  Observaciones (Geoide)

Grupos

Vea esta lista para mostrar los grupos de varianza y el valor del escalar aplicado a todas las observaciones en el grupo. Esta lista aparece automáticamente cuando se selecciona la ficha GPS y Aplicar escalares a se configura como Grupos de varianza. Para más información, véase Grupos.

Bloquear

Pulse este botón para bloquear el Valor escalar actual.

Bloquee el Valor escalar una vez que el ajuste haya pasado la prueba de Chi cuadrada (factor de referencia ~ 1.00) utilizando el tipo de escalar Alternativo. Una vez bloqueado el valor escalar, el Tipo de escalar cambia automáticamente a Definido por el usuario, y el escalar aparece en el campo Valor escalar. No se vuelve a usar el tipo de escalar Alternativo.

NOTA: Cuando se selecciona la opción Tipo de escalar automático, y se ejecuta un ajuste automático, se bloquea el Valor Escalar y el tipo escalar cambia a Definido por el usuario.

El botón Bloquear se inhabilita cuando se utilizan los tipos de escalar Por defecto o Definido por el usuario.

Aplicar

Haga clic en este botón para aplicar el escalar estrategias de ponderación a la iteración del siguiente ajuste. Para que este botón esté disponible hay que seleccionar el tipo de escalar Definido por el usuario.

Filtrar

Haga clic en este botón para mostrar el diálogo Filtro de observación con opciones para filtrar observaciones. El filtrado es útil cuando se están viendo una gran número de observaciones. Todos los filtros se quitan automáticamente cuando se sale del diálogo. Para más información, véase Filtrar observaciones.


    GPS (Estrategias de ponderación)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice la ficha GPS para ver, definir, y aplicar estrategias de ponderación a observaciones GPS.

Para acceder a él:

1.	Seleccione Ajuste / Estrategias de ponderación. Aparecerá el diálogo Estrategias de ponderación.

2.	Seleccione la ficha GPS.

Para acceder a las estrategias de ponderación para grupos de varianza se requiere otro paso.

Para acceder a las opciones de grupo de varianza:

  Configure la opción Aplicar escalares a como Grupos de varianza.

La apariencia del diálogo cambia y la lista Observaciones es sustituida por la lista Grupos. En esta lista se pueden seleccionar los grupos de varianza, y las estrategias de ponderación pueden ser definidas y aplicadas a las observaciones incluidas en los grupos de varianza.


Terrestre (Estrategias de Ponderación)

Visión de Conjunto

Utilice la ficha Terrestre para ver, definir, y aplicar estrategias de ponderación en observaciones terrestres. También puede acceder a las estrategias de ponderación para grupos de varianza.

Para hacer ésto:

1.	Seleccione Ajuste / Estrategias de Ponderación. Aparece el diálogo Estrategias de Ponderación.

2.	Seleccione la ficha Terrestre.

3.	Si desea acceder a las estrategias de ponderación para los grupos de varianza, en el grupo Aplicar escalares a, seleccione la opción Grupos de Varianza.

La lista de Observaciones se transforma en la lista de Grupos, y puede seleccionar los grupos de varianza apropiados desde ella. También puede definir las estrategias de ponderación y aplicarlas a las observaciones incluidas en los grupos de varianza.


    Geoide (Estrategias de ponderación)

Más información

Cómo...	Diálogo	Véase también
Utilice la ficha de Geoide para ver, definir, y aplicar estrategias de ponderación a observaciones de geoide.

Para hacer esto:

1.	Seleccione Ajuste / Estrategias de ponderación. Aparecerá el diálogo Estrategias de ponderación.

2.	Seleccione la ficha Geoide.

Si en la lista no aparece ninguna observación, compruebe la ficha Geoide en el diálogo Observaciones. Al proyecto debe asignarse un modelo geoidal y las separaciones de geoide deben cargarse desde el modelo al proyecto.

NOTA: El error estimado de las separaciones de geoide iniciales es el error típico de la media del conjunto de observaciones. El software Trimble Geomatics Office calcula las medias de todas las separaciones de geoide del ajuste, luego determina el error típico de la media de cada separación. Este es sólo un punto inicial para la estimación de los errores en la separación de geoide y tal vez sea necesario escalar las observaciones para conseguir una verdadera representación de los errores estimados.

NOTA: Puede cambiar el error estándar aumentando el error estándar mínimo para separaciones de geoide en el diálogo Estilos de Ajuste de Red.


    Aplicar escalares a

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice estos botones para seleccionar el método a usar para aplicar el escalar estrategias de ponderación a observaciones o a grupos de varianza.

Están disponibles las siguientes opciones:

Todas las observaciones

Seleccione esta opción para aplicar sólo una estrategia de ponderación escalar a todas las observaciones habilitadas en el ajuste de redes de un tipo especificado (GPS, terrestre, o geoide) basado en los errores generales de la red. Esta es la opción por defecto para el ajuste de redes.

Utilice esta configuración cuando todas las mediciones en la red se realicen siguiendo las mismas normas con el mismo equipo. La aplicación de las estrategias de ponderación a todas las observaciones es una práctica aceptable cuando se trabaja con una red simple.

Cuando el Tipo de escalar se configura como Por defecto se aplica a todas las observaciones un escalar por defecto igual a 1.0.

Cuando el Tipo de escalar se configura como Alternativo se aplica a todas las estimaciones de error de todas las observaciones el factor de referencia del grupo del último ajuste, multiplicado por el escalar del último ajuste.

Cuando el Tipo de escalar se configura como Definido por el usuario aparece el cursor en el campo Escalar de la lista Grupos, lo que permite la introducción de un valor escalar. Cuando se realiza la siguiente iteración del ajuste, el valor introducido en este campo se aplica a todas las estimaciones de error para todas las observaciones.

Cuando se configura el tipo escalar a Automático, el software ejecuta un ajuste automático, usando la opción tipo de escalar Alternativo. El software repite el ajuste hasta que pasa la prueba Chi-cuadrado.

Para evaluar los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste.

Cada Observación

Seleccione esta opción para aplicar una estrategia de ponderación individual a cada vector habilitado incluido en el ajuste de la red, basado en el error de cada vector.

NOTA: Esta opción sólo está disponible en la ficha GPS.

Utilice esta configuración para fines de diagnóstico, tales como la localización de malas observaciones en una red. Trimble no recomienda que se emplee este método de aplicar ponderación escalar para ajustes finales de redes.

Cuando el Tipo de escalar se configura como Por defecto, se aplica a cada observación un escalar por defecto igual a 1.0.

Cuando el Tipo de escalar se configura como Alternativo se aplica a todas las estimaciones de error de cada observación el factor de referencia del grupo de varianza del último ajuste, multiplicado por el escalar del último ajuste.

Para evaluar los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste.

Grupos de varianza

Utilice esta opción para aplicar estrategias de ponderación a todas las observaciones en un grupo de varianza.

NOTA: Esta opción sólo está disponible cuando en el diálogo Estrategias de ponderación se selecciona la fichas GPS o Terrestre.

Cuando se selecciona esta opción, la lista Observaciones es sustituida por la lista Grupos, que muestra todos los grupos de varianza y sus valores escalares.

Cuando el Tipo de escalar se configura como Por defecto se aplica a todas las observaciones del grupo un escalar por defecto igual a 1.0.

Cuando el Tipo de escalar se configura como Alternativo se aplica a todas las estimaciones de error de las observaciones en el grupo el factor de referencia del último ajuste, multiplicado por el escalar del último ajuste.

Cuando el Tipo de escalar se configura como Definido por el usuario aparece el cursor en el campo Escalar de la lista Grupos, lo que permite la introducción de un valor escalar. Cuando se realiza la siguiente iteración del ajuste, el valor introducido en este campo se aplica a todas las estimaciones de error para todas las observaciones en el grupo.

Cuando se configura el tipo escalar a Automático, el software ejecuta un ajuste automático, usando la opción Tipo de escalar Alternativo. El software repite el ajuste hasta que pasa la prueba Chi-cuadrado.

Para evaluar los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste.

Para observaciones GPS están disponibles las opciones: Todas las observaciones, Cada observación, y Grupos de varianza. Para observaciones terrestres, están disponibles las opciones: Todas las observaciones y Grupos de varianza. Para observaciones de geoide, sólo está disponible la opción: Todas las observaciones.

A continuación se muestran posibles combinaciones de estrategias de ponderación:

Tipo de escalar	Aplicar escalares a	Lista de escalares
Por defecto	Todas las observaciones	No se usa ninguna estrategia de ponderación
	Cada observación	No se usa ninguna estrategia de ponderación
	Grupos de varianza	No se usa ninguna estrategia de ponderación
Alternativo	Todas las observaciones	Se aplica globalmente un solo escalar a cada tipo
	Cada observación	Se aplica a cada observación un escalar diferente
	Grupos de varianza	Se aplica globalmente un solo escalar
Definido por	Todas las observaciones	Se aplica globalmente un solo escalar
el usuario	Grupos de varianza	Se aplica un solo escalar para cada grupo
Automático	Todas las Observaciones	Se aplica globalmente un solo escalar
	Grupos de Varianza	Se aplica un solo escalar para cada grupo


    Tipo de escalar

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice estas opciones para seleccionar el tipo de escalar aplicado a las observaciones GPS, las observaciones terrestres, las observaciones de geoide, y los grupos de varianza.

Están disponibles las siguientes opciones:

Por defecto

Utilice esta opción para aplicar a los errores estimados un escalar por defecto igual a 1.0, empleando el método seleccionado en la lista Aplicar escalar a.

Utilice este tipo para la primera iteración del ajuste. Esto aplica el error estimado con su valor facial, lo que permite apreciar los errores en la red. Esta es la configuración por defecto para la primera iteración del ajuste.

NOTA: Cuando se quita del ajuste una observación debe volver a utilizar el escalar de tipo por defecto.

NOTA: Cuando se usa el escalar por defecto para observaciones GPS, se almacenan las coordenadas para los puntos "desde" y se usan en todos los ajustes subsiguientes (hasta que se ejecute otro ajuste escalar por defecto) para modelar los vectores en el elipsoide.

Para evaluar los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste de Red.

Alternativo

Utilice esta opción para aplicar un escalar calculado multiplicando el Factor de referencia del último ajuste por el escalar del último ajuste. El valor de escalar resultante se aplica a los errores estimados utilizando el método seleccionado en la opción Aplicar escalares a. Esto deja al software Trimble Geomatics Office calcular automáticamente el escalar para la siguiente iteración del ajuste.

El escalar alternativo se aplica a los errores estimados para cada iteración del ajuste que se realice hasta que sean aceptables las Estadísticas globales (es decir, que pase la prueba de Chi cuadrada). Una vez que los resultados sean aceptables, bloquee el valor escalar para dejar de aplicar un nuevo escalar a cada iteración sucesiva del ajuste.

Para evaluar los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste.

NOTA: Antes de quitar del ajuste los errores estimados de los periféricos debe intentar aplicarles un escalar de tipo Alternativo. Esto le permite ver si los errores estimados de los periféricos son aceptables después de escalarlos. Si la escalación alternativa no resuelve los periféricos, quítelos y devuelva la estrategia de ponderación al tipo de escalar por defecto.

CUIDADO: Cuando utilice el escalar alternativo controle la magnitud del escalar conforme progresa en las iteraciones del ajuste. La utilización de escalares inusualmente grandes para la resolución de periféricos no es recomendable.

Definido por el usuario

Utilice esta opción para aplicar a los errores estimados un escalar definido por usuario, utilizando el método seleccionado para la opción Aplicar escalares a.

Este tipo es inhabilitado cuando se selecciona Cada observación para la opción Aplicar  escalares a.

El tipo se activa automáticamente cuando se utiliza el botón Bloquear al terminar una escalación alternativa. El último escalar alternativo aplicado al ajuste se coloca en el campo Valor escalar y se convierte en un escalar definido por usuario.

La práctica de definir manualmente escalares requiere un amplio conocimiento de los ajustes por mínimos cuadrados y de las mediciones topográficas. Trimble no recomienda este tipo para el usuario novicio del software Trimble Geomatics Office. Para más información acerca de las mediciones topográficas y de los ajustes por mínimos cuadrados, consulte la Bibliografía.

Automático

Cuando se configura el tipo escalar a Automático, el software ejecuta un ajuste automático, usando la opción tipo de escalar Alternativo. (Para parar el ajuste en cualquier momento, uses la tecla ESC.)

El software repite este ajuste hasta que las estadísticas globales son aceptables; es decir, hasta que pasa la prueba Chi-cuadrado. Sin embargo, si no se pasa la prueba Chi-cuadrado después de 10 iteraciones, el ajuste termina y un mensaje de advertencia aparece; va a necesitar revisar los datos de entrada utilizados en el ajuste.

Si se completa exitosamente el ajuste automático, se bloquea el valor escalar y el tipo escalar se transforma en definido por el usuario. Se ejecuta un ajuste adicional y luego va a poder ver el informe de Ajuste de Red. El informe de Ajuste de Red muestra que fue utilizado el tipo escalar definido por el usuario.

NOTA: Si el ajuste automático no se completa exitosamente (es decir, no pasa la prueba Chi-cuadrado), el informe de Ajuste de Red muestra que el tipo de escalar alternativo fue utilizado.

NOTA: Las equivocaciones en los datos pueden causar el sobre escalamiento de las otras observaciones en el ajuste de modo que asegúrese de haber quitado todas las equivocaciones antes de usar el tipo de escalar Automático. Puede revisar que no hayan equivocaciones ni datos erróneos al ejecutar el ajuste usando la opción escalar por defecto, y luego revisando los resultados.

Después de usar la opción de tipo de escalar, revise cuidadosamente los resultados del ajuste, en particular los histogramas del ajuste, para estar seguro de que no hayan equivocaciones ocultas en las observaciones.

CUIDADO: Trimble le recomienda que no utilice la opción tipo de escalar Automático para escalar observaciones GPS y terrestres al mismo tiempo.

Para más información acerca de evaluar los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste de Red.

Utilizando las diversas opciones son posibles las siguientes estrategias de ponderación.

Tipo de escalar	Aplicar escalares a	Lista de escalares
Por defecto	Todas las observaciones	No se usa ninguna estrategia de ponderación
	Cada observación	No se usa ninguna estrategia de ponderación
	Grupos de varianza	No se usa ninguna estrategia de ponderación
Alternativo	Todas las observaciones	Se aplica globalmente un solo escalar
	Cada observación	Se aplica a cada observación un escalar diferente
	Grupos de varianza	Se aplica globalmente un solo escalar
Definido por	Todas observaciones	Se aplica globalmente un solo escalar
el usuario	Grupos de varianza	Se aplica un solo escalar para cada grupo
Automático	Todas las Observaciones	Se aplica globalmente un solo escalar
	Grupos de Varianza	Se aplica un solo escalar para cada grupo

Para conocer las normas acerca de la evaluación de los resultados de las estrategias de ponderación, véase la sección Estrategias de ponderación del informe Ajuste.


    Observaciones (Estrategias de ponderación)

Más Información

 Véase también

Visión de Conjunto

Utilice la lista de Observaciones para ver la estrategia de ponderación utilizada para cada observación que fue incluida en un ajuste de la  red. Una variante de esta lista aparece en las fichas GPS, Terrestre, y Geoide en el diálogo Estrategias de ponderación.

Sin embargo, en las fichas Terrestre y GPS, cuando Aplicar escalar a se configura a Grupos de Varianza, la lista de Observaciones automáticamente se transforma en la lista de Grupos..

Para más información, véanse estos temas:

  Observaciones − observaciones GPS

  Observaciones − observaciones Terrestres

  Observaciones − observaciones de Geoide


Observaciones (Estrategias de ponderación - GPS)
    Observaciones (Estrategias de ponderación − GPS)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Utilice esta lista de Observaciones para ver el escalar estrategias de ponderación para todas las observaciones GPS que fueron incluidas en un ajuste de la red. No puede editar la información en la lista.

La lista Observaciones sólo está disponible cuando Aplicar escalares a se configura como Todas las observaciones o Cada observación. Cuando Aplicar escalar a se configura a Grupos de Varianza, la lista de Observaciones automáticamente se transforma en la lista Grupos.

SUGERENCIA: Puede utilizar el botón de Filtrar para filtrar las observaciones tomadas usando diferentes métodos de topográficos. El filtrar oculta temporalmente algunas observaciones facilitando el ver otras. Utilice el campo Tipo para determinar el método topográfico usado para tomar observaciones. Para más información, véase Filtrar observaciones.

Están disponibles las siguientes columnas:

Columna	Lo que muestra
Obs	Este campo muestra el número de registro de la observación en el ajuste de la red. Como primer carácter del número se anexa una ‘B’ para denotar que el registro es una observación GPS.
Desde pto	Este campo muestra el nombre del punto inicial de la observación.
Al punto	Este campo muestra el nombre del punto final de la observación.
Escalar	Este campo muestra el escalar individual para la observación.
Tipo	Este campo muestra el tipo de observación GPS.
Grupo de varianza	Este campo permite conocer el grupo de varianza al que está asignada la observación. Las observaciones GPS individuales sólo pueden asignarse a un solo grupo de varianza—es decir, pueden existir múltiples grupos definidos por usuario, pero cada observación sólo puede asignarse a uno de esos grupos.
CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


Observaciones (Estrategias de ponderación - Geoide)
    Observaciones (Estrategias de ponderación − Geoide)

Más información

Cómo...	Diálogo	Véase también
Visión de Conjunto

Utilice esta lista de Observaciones para ver las observaciones de geoide cargadas en el proyecto. No puede editar la información en la lista de Observaciones.

Esta lista estará en blanco si no se ha seleccionado un modelo geoidal para el proyecto o si no se han cargado separaciones de geoide.

Están disponibles las siguientes columnas:

Columna	Lo que muestra
Obs	Este campo muestra el número de registro de la observación en el ajuste de la red. Como primer carácter del número se anexa una "G" para denotar que el registro es una observación de geoide.
Punto	Este campo muestra el nombre del punto utilizado para generar la observación de geoide.
Siguiente Escalar	Este campo muestra el valor del siguiente escalar que será aplicado a la observación.
Separación	Este campo muestra la separación de geoide respecto al modelo geoidal seleccionado.
Error	Este campo muestra el error estimado en la observación de geoide.
Grupo de varianza	Este campo permite saber si la observación está asignada a un grupo de varianza. Dado que sólo puede existir un solo grupo, todas las observaciones de geoide se asignan al grupo <Geoide por defecto>. NOTA: El grupo <Geoide por defecto> será siempre el único grupo de varianza de geoide disponible en cualquier ajuste de red. Puesto que el mismo método se utiliza para interpolar para cada observación de geoide del mismo modelo geoidal, no es necesario separarlos en múltiples grupos.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


    Grupos (Estrategias de ponderación)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Esta lista deGrupos muestra los grupos de varianza y el valor de escalar aplicado a todas las observaciones en el grupo.

En las fichas GPS y Terrestre del diálogo Estrategias de ponderación, la lista de Grupos queda disponible cuando Aplicar escalares a se configura como Grupos de varianza. La lista no está disponible en la ficha de Geoide.

Están disponibles las siguientes columnas:

Columna	Lo que muestra
Nombre del grupo	Esta columna muestra el nombre del grupo de varianza. No puede editar la información en esta columna.
Siguiente Escalar	Esta columna muestra el siguiente escalar utilizado para los grupos de varianza. Puede introducir un valor escalar en esta columna cuando se selecciona un tipo escalar definido por el usuario. Si el escalar es de tipo Por defecto o Alternativo, no puede editar la información en esta columna.
CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.


Observaciones (Estrategias de Ponderación - Terrestre)

Visión de Conjunto

Esta lista está disponible cuando Aplicar escalar a está configurada a Todas las Observaciones. Puede usarla para ver las estrategias de ponderación escalar para todas las observaciones terrestres que estaban en el ajuste de la red. Sin embargo, no puede editar estos campos.

CONSEJO: Puede utilizar el botón Filtrar para filtrar distintos tipos de observaciones. El filtrar oculta temporalmente algunas observaciones facilitando el ver otras. Para más información, véase Filtrar Observaciones.

Estas columnas están disponibles:

Columna	Lo que muestra
Obs	Este campo muestra el número de registro asignado a la observación en el ajuste de red. Los números de las observaciones terrestres van precedidos por la letra "T". La letra "L" precede a las observaciones de nivel.
Punto REF	Esta columna muestra el nombre del punto visual hacia la referencia de la observación.
Punto Instr.	Esta columna muestra el nombre del punto instrumental de la observación.
Punto AD	Esta columna muestra el nombre del punto de la observación hacia adelante.
Siguiente Escalar	Esta columna muestra el siguiente escalar que se aplicará a las observaciones.
Grupo de varianza	Esta columna muestra el grupo de varianza asignado a las observaciones. A pesar de que pueden existir multiples grupos definidos por el usuario, sólo puede asignar cada observación terrestre a un solo grupo de varianza.

CONSEJO: Puede cambiar el tamaño, mover, u ordenar columnas en la lista.

NOTA: Las observaciones de nivel y de acimut se tratan como observaciones terrestres. Para estas observaciones, considere el punto Instr. como el punto "desde" y el punto AD como el punto "a".


    Cabecera del ajuste

Más información

 Véase también

Visión de conjunto

Utilice la Cabecera del ajuste, que aparece en la parte superior del informe, para ver la información del proyecto.

La Cabecera contiene la información tomada de las propiedades del proyecto. Al lado izquierdo de la pantalla se muestra una sección de Indice de materias que contiene los hypervínculos utilizados para mostrar las secciones del informe.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	Utilice los hipervínculos en la sección Indice de materias para examinar el informe.

Están disponibles los siguientes campos o subsecciones:

Proyecto

Este campo muestra el nombre del proyecto.

Nombre del usuario

Este campo muestra el nombre introducido en las propiedades del proyecto.

Fecha y Hora

Este campo muestra la fecha y la hora en que se generó el informe.

Sistema de coordenadas

Este campo muestra el sistema de coordenadas seleccionado en las propiedades del proyecto.

Zona

Este campo muestra la zona del sistema de coordenadas seleccionada en las propiedades del proyecto. Si se seleccionó Calibración local GPS, en el campo Zona se muestra el nombre del lugar.

Todos los sistemas de coordenadas publicados tienen una zona. El único sistema de coordenadas sin una zona es la proyección por defecto que muestra "por defecto" en el campo Zona. El valor por defecto se utiliza cuando se suponen coordenadas locales, tales como N = 10000, E = 10000, y elev = 100.

Datum del proyecto

Este campo muestra el datum del proyecto seleccionado en las propiedades del proyecto. Este no representa el datum seleccionado para el ajuste.

Datum Vertical

Puede agregar este campo a la información de cabecera del informe de Ajuste de Red. Para mostrar el datum vertical utilizado en el proyecto, añada todos los detalles que sean necesarios al campo de Datum Vertical en el  diálogo Propiedades Proyecto – ficha Detalles del Proyecto.

Modelo geoidal

Este campo muestra el modelo geoidal si se asignó un modelo en las propiedades del proyecto. Cuando no se asigna al proyecto ningún modelo geoidal, este campo muestra 'No seleccionado'.

Unidades de coordenadas

Este campo muestra las unidades del sistema de coordenadas seleccionadas en las propiedades del proyecto.

Unidades de distancia

Este campo muestra las unidades de distancia seleccionadas en las propiedades del proyecto.

Unidades de Altura

Este campo muestra las unidades de altura seleccionadas en las propiedades del proyecto.

Indice de materias

La sección Indice de materias se encuentra inmediatamente después de las estadísticas antes mencionadas, e incluye estos hipervínculos:

  Detalles del Proyecto

  Configuraciones de Estilos de Ajuste

  Tolerancias Residuales

  Presentación de Covarianza

  Controles de Ajuste

  Errores de Configuración

  Resumen Estadístico

  Estadísticas de Observación GPS

  Estadísticas del Modelo Geoidal

  Estadísticas de Observaciones Terrestres

  Estrategias de Ponderación

  Coordenadas Ajustadas

  Coordenadas de Cuadrícula

  Coordenadas Geodésicas

  Incrementos de Coordenadas

  Comparaciones de Coordenadas de Control

  Observaciones Ajustadas

  Observaciones GPS

  Observaciones de Geoide

  Observaciones Terrestres

  Histogramas para Residuales Estandarizados

  Elipses de Error de Puntos

  Términos de Covarianza

Para saber más acerca de secciones individuales del informe, seleccione los hipervínculos pertinentes anteriores.


    Coordenadas ajustadas

Más información

 Véase también

Visión de Conjunto

Utilice estas estadísticas para ver rápidamente:

  Número de puntos

  Número de puntos limitados a componentes de coordenadas.

  Valores de coordenadas de puntos limitados y ajustados.

  Errores normalizados (estimados) a posteriori de cada punto del ajuste.

  Errores estimados finales

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el índice de materias de la Cabecera del ajuste haga clic en Coordenadas ajustadas.

Las secciones Coordenadas ajustadas comienzan con un conjunto de campos, seguidos por tablas separadas, que muestran:

  Coordenadas de cuadrícula ajustadas

  Coordenadas geodésicas ajustadas

  Incrementos de coordenadas ajustadas

Estas tablas contienen datos de cada punto en el ajuste de la red.

Estas estadísticas comprenden:

Ajuste realizado en

Este campo identifica el datum utilizado para realizar el ajuste de la red. Para un ajuste mínimamente limitado, o ajuste libre, debe utilizarse el datum WGS-84. Si se selecciona el datum WGS-84, el campo muestra generalmente:

Ajuste realizado en WGS-84

Los ajustes totalmente limitados se realizan generalmente utilizando el datum del proyecto. En el ejemplo anterior, WGS-84 sería sustituido por el datum del proyecto.

Numero de puntos

Este campo indica el número de puntos incluidos en el ajuste de la red.

Número de puntos limitados

Este campo indica el número de puntos con componentes de coordenadas limitadas.

El número de puntos limitados se separa en una descripción de componentes fijos. Por ejemplo:

  Horizontal solamente

  Altura solamente

  Elevación solamente

  Horizontal y altura solamente

  Horizontal y elevación solamente

  Horizontal más altura y elevación

Los campos mencionados van seguidos inmediatamente por estas tablas:

  Coordenadas de cuadrícula ajustadas

  Coordenadas geodésicas ajustadas

  Incrementos de coordenadas ajustadas

Para más información acerca de la evaluación de los datos incluidos en cada tabla, véanse los temas anteriores.


    Incrementos de coordenadas

Más información

 Véase también

Visión de Conjunto

Esta tabla indica la magnitud del desplazamiento (ajuste) de las coordenadas de los puntos en el ajuste más reciente.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el índice de materias al lado izquierdo de la pantalla, haga clic en Coordenadas Ajustadas - Deltas.

Aparecerán las estadísticas Incrementos de coordenadas ajustadas.

Estas estadísticas listan todos los puntos y la magnitud del desplazamiento aplicado a cada componente durante el último ajuste. Los incrementos se muestran en unidades lineales, según las unidades seleccionadas para las coordenadas en el proyecto.

La información sobre los incrementos de las coordenadas ofrecen su mayor utilidad tras realizar un ajuste totalmente limitado y, específicamente, en la evaluación de la magnitud de los desplazamientos.

Estas columnas incluyen:

Columna	Muestra el ajuste (desplazamiento) para el …
Nombre del punto	−
ΔNorte	Este campo muestra el ajuste (desplazamiento) para el componente Norte de la coordenada.
ΔEste	Este campo muestra el ajuste (desplazamiento) para el componente Este de la coordenada
ΔElevación	Este campo muestra el ajuste (desplazamiento) para la elevación de la coordenada.
ΔAltura	Este campo muestra el ajuste (desplazamiento) de la altura sobre el elipsoide de la coordenada.
ΔSeparación de geoide	Este campo muestra el ajuste (desplazamiento) para la separación de geoide si se define un modelo geoidal y se cargan en el proyecto separaciones de geoide. Cuando no están disponibles las separaciones de geoide, este campo está en blanco.


    Términos de covarianza

Más información

 Véase también

Visión de Conjunto

Estas estadísticas muestran la precisión relativa de la línea (términos de covarianza) entre puntos del ajuste.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Términos de covarianza.

Aparecerán las estadísticas Términos de covarianza.

El número de términos de covarianza mostrados varía en función de las propiedades generales definidas en el estilo de ajuste.

  Todas las líneas – Si se quitan las marcas de verificación en las opciones Usar perfil de columna reducido y Restringir términos de covarianza a líneas observadas, se mostrarán todos los acimutes, incrementos de altura del elipsoide, incrementos de elevación y distancia posibles con los errores asociados entre todos los puntos de la red.

  Líneas observadas – Si se seleccionan las opciones Usar perfil de columna reducido y Restringir términos de covarianza a líneas observadas se mostrarán todos los acimutes, incrementos de altura del elipsoide, incrementos de elevación y distancia posibles con los errores asociados para todas las líneas observadas, únicamente.

Para más información acerca de cambiar el contenido de estas estadísticas, véase Presentación de covarianza.

Utilice estas estadísticas de precisión para conocer el error relativo en cualquier par de puntos de la red.

Están disponibles las siguientes columnas de la tabla:

Columna	Lo que muestra
Desde punto	Esta columna identifica el punto inicial de los términos de covarianza relativos.
Al punto	Esta columna identifica el punto final de los términos de covarianza relativos.
Componentes	Esta columna muestra las componentes de la línea relativa entre los puntos.
Error a posteriori (   )	Esta columna presenta el error a posteriori de los componentes de las observaciones. Entre paréntesis se muestra el nivel de confianza seleccionado en Estilo de ajuste, que se usa para calcular las estimaciones a posteriori.
Precisión horz. (    )	Esta columna presenta la precisión bidimensional u horizontal de los valores de la covarianza. Entre paréntesis se muestra el método de expresión de las precisiones (PPM o Razón).
Precisión 3D (    )	Estos tres campos presentan la precisión tridimensional de los valores de la covarianza. Entre paréntesis se muestra el método de expresión de las precisiones (PPM o Razón).


    Histogramas para los residuales normalizados

Más información

 Véase también

Visión de Conjunto

Utilice estos histogramas para ver esta información:

  Distribución de frecuencias de los residuales normalizados.

  Observaciones periféricas

  Curva de distribución normal

  Valor de Tau crítico

Para acceder a estos histogramas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe  de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Histogramas de residuales normalizados.

Aparecerán los Histogramas de residuales normalizados.

Estos histogramas incluyen:

  Combinado – dibujo combinado tanto para los residuales normalizados de observaciones tanto horizontales como verticales.

  Horizontal – dibujo para residuales normalizados de observaciones horizontales.

  Vertical – dibujo para residuales normalizados de observaciones verticales.

Los histogramas muestran gráficamente la distribución de frecuencia de los residuales normalizados de observaciones en el ajuste más reciente. Las estadísticas Observaciones ajustadas presentan los residuales normalizados para cada observación.

La línea vertical central es el residual cero. Tomando como base la distribución normal, los residuales más pequeños se agrupan alrededor de ella y muestran la frecuencia más alta de los residuales dibujados. Los residuales más grandes se sitúan más alejados de la línea cero con frecuencia en disminución.

Si los residuales del ajuste están distribuidos aleatoriamente, la gráfica de distribución de frecuencias se aproxima a la curva de distribución normal. La curva se superpone sobre la gráfica de residuales.

Las líneas verticales a la izquierda y derecha de la línea cero muestran el valor de Tau crítico. Todo valor residual normalizado exterior a esa líneas es considerado un "periférico". La escala de barra representa el valor sigma. El valor sigma coincide con el valor Tau en las estadísticas de observaciones ajustadas.


    Estadísticas de observaciones GPS individuales

Más información

 Véase también

Visión de Conjunto

Estas estadísticas muestran el número ID de observación, el factor de referencia y el número de redundancias (grados de libertad) de cada observación incluida (utilizada) en el ajuste.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes.

2.	En el Indice de materias, haga clic en Estadísticas de observación GPS.

A continuación se muestran algunas estadísticas a modo de ejemplo:

ID observación	Factor referencia	Número redundancia
LB1	1.56	2.03
LB2	0.96	1.88
LB3	1.21	1.66
LB4	2.06	1.93

Están incluidos los siguientes campos:

ID observación

Utilice este campo para conocer el número de registro en el proyecto asignado a la observación. El número de registro consta de la letra ‘LB’ seguida por uno o más números.

Factor de referencia

Utilice este campo para conocer cuánto contribuye el factor de referencia de cada observación individual al factor de referencia de las Estadísticas de observaciones GPS.

NOTA: Cuando se calcula el factor referencia para todas las observaciones GPS se toman en consideración los factores de referencia de todas las observaciones individuales. Ese valor , junto con el factor de referencia de las observaciones de geoide, se utiliza para calcular el Factor de referencia de la red.

Número de redundancias

Utilice este campo para conocer cuánto contribuye la redundancia de cada observación GPS a las Estadísticas de las observaciones GPS. Este campo permite conocer si las observaciones GPS individuales carecen de redundancias. El número de redundancias de las Estadísticas de las observaciones GPS, junto con el número de redundancias de las observaciones de geoide, se utiliza para calcular los Grados de libertad de la red.

Considere estas normas:

  Tras evaluar el Factor de referencia de la red y los Grados de libertad en la sección Estadísticas globales, evalúe estas estadísticas de observaciones individuales. Todos los factores de referencia individuales deben estar centrados alrededor de 1.0.

  Al examinar la lista, busque consistencia. Observe cualquier valor extremo que sea mucho mayor o menor que 1.0. Quite del ajuste los periféricos para conseguir más consistencia en las estadísticas del factor de referencia individual.

  Los números individuales de redundancias dan una evaluación de la redundancia con que cada observación contribuye a los grados de libertad globales para la red.

  Todos los números deben ser mayores que 0.00 y menores, o iguales, que 3.00.

  Cuanto más se aproxime a 3.0 el número de redundancias, más redundancias estará contribuyendo la observación a la red.

  Un número de redundancias igual a 0.00 sugiere que la observación sólo está conectada a un extremo de otra observación. En términos topográficos, esta condición se conoce como toma lateral. Si la toma lateral no fue intencionada, compruebe por qué la observación no contribuye a la redundancia general de la red.

NOTA: El estado de una observación asociada con una toma lateral puede ser "Habilitar como toma comprobada".


    Número de iteraciones

Más información

 Véase también

Visión de Conjunto

Utilice el mensaje que se muestra en este campo para conocer el número de iteraciones realizadas para lograr la convergencia del ajuste.

Para acceder a este mensaje:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Número de iteraciones.

Aparecerá el campo Número de iteraciones.

A continuación se muestran todos los mensajes posibles:

Ajuste logrado en # iteración(es)

Ajuste logrado en # iteración(es) (se ha utilizado límite de convergencia final)

(# = número de iteraciones)

El número de iteraciones comunicado nunca excede del máximo de iteraciones seleccionado en el diálogo Editar estilo de ajuste.

NOTA: Si no se logra la convergencia del ajuste no se genera un informe.


    Observaciones ajustadas

Más información

 Véase también

Visión de conjunto

Utilice estas estadísticas para conocer esta información acerca de las observaciones GPS y de geoide ajustadas:

  Datum utilizado en el ajuste

  Valor Tau crítico utilizado en el ajuste

  Componentes de la observación con su error normalizado (estimado) asociado a posteriori, residual, y residuales normalizados.

  Componentes de la observación señalados como periféricos

  Parámetros de transformación con sus errores estimados asociados (ajuste totalmente limitado).

  Un resumen de las observaciones utilizadas en el ajuste y una lista de todas las observaciones (GPS, terrestre, y de geoide).

Utilice las tablas de observaciones de observaciones GPS y de geoide para:

  Verificar el número de observaciones utilizadas en el ajuste.

  Evaluar los errores normalizados a posteriori de cada componente de observación.

  Identificar aquellos componentes de observaciones que excedan del valor Tau crítico definido para la red (periféricos). Las observaciones sospechosas (periféricos) se resaltan en rojo.

  Identificar cualquier transformación inesperada y los valores estimados con errores grandes en los parámetros.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Observaciones ajustadas.

Aparecerán las estadísticas de Observaciones ajustadas.

La sección se divide en las siguientes partes:

  GPS

  Terrestre

  Geoide

NOTA: Puede seleccionar observaciones en la vista de Levantamiento del informe de Ajuste de Redes. Para hacer ésto, seleccione el número de identificación del informe de Ajuste de Redes. (Para seleccionar observaciones múltiples, use la tecla Ctrl). Cuando se selecciona una observación en el informe, se borra la selección actual en la vista de Levantamiento y se reemplaza por la(s) observación(es) seleccionada(s) desde el informe.


    Elipses de error de puntos

Más información

 Véase también

Visión de conjunto

Utilice estas estadísticas para ver una representación gráfica de la magnitud y dirección de los errores de los puntos (tanto horizontales como verticales). Las elipses de error de puntos muestran gráficamente los errores normalizados a posteriori de la coordenada horizontal de un punto del ajuste y el término de covarianza entre puntos.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Elipses de error de puntos.

Aparecerán las estadísticas Elipses de error de puntos.

Considere estas normas:

  La parte superior de la elipse está orientada al norte.

  Las flechas a la derecha de la elipse representan los errores normalizados a posteriori para las alturas y elevaciones.

  La barra de escala que atraviesa la elipse y la flecha indican la magnitud de los errores.

  El valor de las divisiones en la barra de escala se muestra en las unidades del proyecto junto con la elipse de error. Mediante la barra de herramientas de la elipse en la ventana Gráficos, se puede editar el valor de las divisiones en la barra de escala para ajustar la resolución de la barra de escala. La barra de herramientas de la elipse no afecta a la escala del las elipses de error del Informe de ajuste de redes.

  La orientación del semieje mayor (el eje que indica la dirección del mayor error) se muestra en la parte inferior derecha de la elipse. Este ángulo se mide en sentido opuesto al de las agujas del reloj desde el Este positivo de la barra de escala.

  Los errores normalizados de las coordenadas horizontales y verticales se multiplican por los escalares sigma  bivariables y monovariables, respectivamente.


    Resumen estadístico

Más información

 Véase también

Visión de conjunto

Utilice esta parte del informe para lograr un rápido acceso a las secciones del resumen estadístico.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquiedo de la pantalla, haga clic en Resumen estadístico.

Aparecerá el Resumen estadístico.

El resumen estadístico es una herramienta importante para el análisis de los resultados del ajuste. Desde el resumen se accede a las siguientes secciones claves del informe:

  Número de iteraciones

  Estadísticas globales

  Estadísticas para tipos de observación

  Estadísticas para grupos de varianza

  Estrategias de ponderación

  Estadísticas de observaciones GPS individuales

Típicamente, usted irá derecho al resumen estadístico (y específicamente a Estadísticas globales) para analizar los resultados generales al realizar un ajuste minimamente limitado. Los valores de la prueba de Chi cuadrada, del Factor de referencia de la red y de los Grados de libertad en la sección Estadísticas globales son indicadores claves para mostrar la bondad del ajuste de la red.


    Estadísticas de los grupos de varianza

Más información

 Véase también

Visión de conjunto

Utilice el resumen Estadísticas del grupo de varianza para conocer el factor de referencia y el número de  redundancias (grados de libertad) determinados para cada grupo de varianza.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del informe en su parte superior.

2.	En el Indice de materias, haga clic en Estadísticas para grupos de varianza.

Aparecerán las Estadísticas para el grupo de varianza.

Para cada grupo de varianza se presentan los siguientes campos:

Nombre del grupo

Este campo muestra el nombre del grupo de varianza.

Factor de referencia

Este campo muestra cuánto contribuye cada grupo de varianza al Factor de referencia de la red. Cada grupo de varianza tiene sus propios errores estimados, de ahí que tengan su propio factor de referencia.

Número de redundancia

Este campo muestra cuánta redundancia contribuye cada grupo de varianza a los Grados de libertad de la red. Utilice este campo para saber si un grupo de varianza carece de redundancias.


    Estrategias de ponderación

Más información

 Véase también

Visión de conjunto

Utilice estas estadísticas para saber si a los conjuntos de observaciones GPS, observaciones de geoide, o grupos de varianza, se han aplicado el método escalar, el tipo escalar y el valor escalar correctos.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del informe en su parte superior.

2.	En el Indice de materias, haga clic en Estrategias de ponderación.

Aparecerán las estadísticas Estrategias de ponderación.

Para cada conjunto de observaciones GPS, observaciones terrestres, observaciones de geoide, o grupos de varianza se generan resúmenes independientes que constan de un título, una cadena descriptiva y un campo escalar. A continuación se muestra, a modo de ejemplo, un resumen para observaciones GPS:

Observaciones GPS
Conjunto escalar por defecto aplicado a todas las observaciones
Escalar: 1.00

El ejemplo anterior significa que el tipo escalar por defecto se aplicó a todas las observaciones GPS utilizando el valor escalar por defecto: 1.0. A continuación se describen los campos que figuran en la sección Estrategias de ponderación del informe. Observe que en el informe podrían aparecer varias combinaciones de estos resúmenes, dependiendo del número de grupos de observaciones y del tipo de estrategias de ponderación aplicadas a los conjuntos de observaciones.

A continuación se muestra la relación entre Título, Cadena, y Campo escalar:

Título	·	Observaciones GPS
Cadena 	·	Conjunto escalar por defecto aplicado a todas las observaciones
Campo escalar	·	Escalar: 1.00

Título

En el ejemplo anterior, Observaciones GPS es el título de un conjunto de estrategias de ponderación aplicado a todas las observaciones GPS. Bajo la sección Estrategias de ponderación aparecerá un título por cada tipo de grupo de observaciones utilizado en el ajuste.

Aplicar Escalares a/Tipo de Escalar

El primer campo del resumen para cada conjunto de observaciones es una cadena que representa el tipo de escalar empleado junto con el método utilizado para aplicar el escalar a un conjunto de observaciones. Este campo sigue inmediatamente a un título que describe el conjunto de observaciones. En el ejemplo anterior, el título es ‘Observaciones GPS' y la cadena es ‘Escalar por defecto aplicado a todas las observaciones’.

Las cuatro palabras ‘Escalar aplicado a’ siempre aparecen en la cadena. Estas palabras van precedidas por la configuración Tipo de escalar y seguidas por la configuración Aplicar escalares a. Estas configuraciones se definen en el diálogo Estrategias de ponderación. A continuación se relacionan combinaciones de cadenas posibles para diversos conjuntos de observaciones:

  Escalar por defecto aplicado a todas las observaciones

  Escalar alternativo aplicado a todas las observaciones

  Escalar definido por el usuario aplicado a todas las observaciones

  Escalar por defecto aplicado a cada observación

  Escalar alternativo aplicado a cada observación

  Escalar por defecto aplicado a grupo de varianza

  Escalar alternativo aplicado a grupo de varianza

  Escalar definido por el usuario aplicado a grupo de varianza

NOTA: La opción tipo de escalar Automático se ejecuta en multiples iteraciones del escalar alternativo. Si se selecciona el tipo escalar Automático, y el ajuste se completa exitosamente, se muestra el escalar definido por el usuario en las cadenas mostradas en la parte superior. Si el ajuste automático no es exitoso (no pasa la prueba Chi-cuadrado) se muestra el escalar alternativo en las cadenas que se enumeran en la parte superior.

Verifique las estrategias de ponderación correctas en la cadena y utilice el campo Escalar, véase a continuación, para determinar si a cada conjunto de observaciones de grupos de varianza se aplicó el escalar correcto.

Campo escalar

El campo Escalar identifica el valor escalar aplicado a cada conjunto de observaciones. En el informe podrían aparecer varios de estos campos, dependiendo de cuántos grupos de observaciones se tengan en un ajuste. Colectivamente, cada cadena y valor escalar representan las estrategias de ponderación aplicadas a sus respectivos conjuntos de observaciones.

Evalúe cada uno de estos campos para saber si los valores escalares aplicados al conjunto de observaciones correspondiente es razonable. Debido a que varias combinaciones de estrategias de ponderación podrían definirse para diversos conjuntos de observaciones, esta sección del informe podría incluir varios pares de cadenas y valores escalares. Cada uno de estos conjuntos de campos debe evaluarse como un grupo.


    Coordenadas de cuadrícula

Más información

 Véase también

Visión de Conjunto

Estas estadísticas muestran las coordenadas de cuadrícula ajustadas de cada punto en el último ajuste. En las coordenadas se incluyen los errores normalizados a posteriori (multiplicados por el escalar sigma univariada) asociado con el componente de cada coordenada. En la parte superior de la lista de coordenadas se muestra el error monovariable seleccionado en Estilo de ajuste.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Coordenadas de cuadrícula.

Se mostrarán las estadísticas Coordenadas de cuadrícula.

Se incluyen las siguientes columnas:

Columna	Lo que muestra
Nombre del punto	Esta columna muestra el nombre del punto descrito en las restantes columnas.
Norte	Esta columna muestra la componente norte ajustada del punto, en unidades del sistema de coordenadas.
Error N	Este campo muestra el error calculado para la componente norte ajustada, en unidades del proyecto.
Este	Esta columna muestra la componente este ajustada del punto, en unidades del sistema de coordenadas.
Error E	Este campo muestra el error calculado para la componente Este ajustada, en unidades del proyecto
Elevación	Este campo muestra la componente de la coordenada elevación ajustada para el punto, en unidades del sistema de coordenadas.
error e	Este campo muestra el error calculado para la componente de la coordenada elevación ajustada para el punto, en unidades del proyecto.
Fijo	Esta columna muestra los puntos limitados en el ajuste y el componente de coordenada limitada. Las componentes de coordenadas limitadas comprenden sólo la horizontal (2D), sólo la vertical (altura o elevación), u horizontal y vertical.
Estos códigos aparecen en la columna para identificar a las componentes:

Código	Significado
N E	Horizontal 2D
h	Altura
e	Elevación
NOTA: Tal vez no todos los puntos limitados tengan errores normalizados a posteriori asociados con las componentes de coordenadas. Estos errores se muestran como 0.000. Si no hay ningún valor disponible para una componente, ni errores a posteriori asociados, en la columna se muestra N/A.


    Coordenadas geodésicas

Más información

 Véase también

Visión de conjunto

Utilice esta tabla de estadísticas para ver las coordenadas geodésicas ajustadas de cada punto en el último ajuste. Las coordenadas incluyen los errores normalizados a posteriori (multiplicados por el escalar sigma univariada) asociados con cada componente de coordenada.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el Informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Coordenadas geodésicas.

Aparecerán las estadísticas Coordenadas geodésicas.

Se incluyen las siguientes columnas:

Columna	Lo que muestra
Nombre del punto	Esta columna muestra el nombre del punto descrito en las restantes columnas.
Latitud	Esta columna presenta la componente de la coordenada latitud ajustada del punto en el datum del ajuste.
Error N	Este campo presenta el error calculado para la componente de la coordenada latitud, en unidades del proyecto.
Longitud	Esta columna presenta la componente de la coordenada longitud ajustada del punto en el datum del ajuste.
Error E	Este campo presenta el error calculado para la componente de la coordenada longitud, en unidades del proyecto.
Altura	Este campo presenta la componente de la coordenada altura sobre el elipsoide ajustada del punto, en unidades del proyecto.
Error h	Este campo presenta el error calculado para la componente de la coordenada altura sobre el elipsoide, en unidades del proyecto.
Fijo	Esta columna muestra los puntos limitados en el ajuste y el componente de coordenada limitada. Las componentes de coordenadas limitadas comprenden sólo la horizontal (2D), sólo la vertical (altura sobre el elipsoide o elevación), u horizontal y vertical.
Estos códigos aparecen en la columna para identificar a las componentes:

Código	Significado
Lat Long	Horizontal 2D
h	Altura
e	Elevación
NOTA: Tal vez no todos los puntos limitados tengan errores normalizados a posteriori asociados con las componentes de coordenadas. Estos errores se muestran como 0.000. Si no hay ningún valor disponible para una componente, ni errores a posteriori asociados, en la columna se muestra N/A.


    Estadísticas globales

Más información

 Véase también

Visión de Conjunto

Estas estadísticas muestran la bondad del ajuste de la red:

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Estadísticas globales.

Aparecerán las Estadísticas globales.

A continuación se muestra, a modo de ejemplo, una sección del informe:

Factor de referencia de la red	 :	6.42
Prueba de Chi cuadrada (a=95%) :	FALLO
Grados de libertad         	 :	36.00

Incluye los siguientes campos:

Factor de referencia de la red

Este valor permite conocer la bondad con que los errores del ajuste a priori (preajuste) coinciden con los errores a posteriori (post-ajuste).

El factor de referencia de la red resulta útil para saber si los errores aleatorios en las observaciones son aceptables y si coinciden con los errores normalizados estimados para esas observaciones. El factor de referencia de la red debe ser aproximadamente igual a 1.0.

Prueba de Chi-cuadrada

Este valor permite saber la bondad del ajuste de la red. Si el factor de referencia está próximo a 1.0 y el valor de los grados de libertad es aceptable, la red se está ajustando matemáticamente, y la prueba de la Chi-cuadrada pasa.

Cuando se logra un buen ajuste por mínimos-cuadrados, el cierre matemático de la red es un factor importante. Considere a la prueba de la Chi-cuadrada como el primer indicador de un cierre matemático.

Grados de libertad

Este valor permite conocer la cantidad global de redundancias en la red. El valor de Grados de libertad identifica el número de observaciones independientes incluidas en el ajuste que fueron utilizadas para sobredeterminar las soluciones. Cuanto mayor sea el número, más redundancias se tendrán en el ajuste.

Los valores del número de redundancias para las observaciones GPS, observaciones terrestres, y para las observaciones de geoide se utilizan colectivamente para determinar este valor global de los grados de libertad para la red.


    Estadísticas para tipos de observaciones

Más información

 Véase también

Más Información

Utilice estas estadísticas para conocer el factor de referencia (RF) y el número de redundancias (grados de libertad) determinados para cada tipo de observaciones; esto es, GPS, terrestre y geoide.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Resumen de Estadísticas.

Aparecen las secciones de Estadísticas de Observación GPS, Estadísticas de Observaciones Terrestres, o Estadísticas de Observación de Geoide.

Las estadísticas de Modelo geoidal están disponibles después de cargar las observaciones de geoide.

Para más información, véanse estos temas:

  Estadísticas de observaciones GPS

  Estadísticas de observación terrestre

  Estadísticas del modelo geoidal


    Estadísticas de observaciones GPS

Más información

 Véase también

Visión de Conjunto

Vea el Factor de Referencia y Número de Redundancias (Grados de Libertad) determinados por las observaciones GPS en el resumen de Estadísticas de Observación GPS de las estadísticas para los tipos de observación.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Resumen Estadístico − Observaciones GPS.

Las estadísticas para tipos de observaciones GPS aparecen con las estadísticas de observaciones GPS que aparecen en la cabecera de la sección.

Se presentan los siguientes campos:

Factor de referencia

Cada tipo de observación tiene sus propios errores estimados y, por ello, su propio factor de referencia. Este valor muestra cuánto contribuye cada tipo de observación al factor de referencia de la red. El software Trimble Geomatics Office permite trabajar con cada método de observación (GPS, terrestre, o geoide) separadamente, para ponderar independientemente cada grupo de observaciones y luego aplicar la adecuada cantidad de escala a las estimaciones del error de cada grupo.

Número de redundancias

El número de redundancias, llamado a veces grados de libertad, es un indicador de cuánto contribuye cada observación a la redundancia general. Utilice estas estadísticas para identificar qué observaciones carecen de redundancia.

Estadísticas de Grupo de Varianza GPS

Se informan estos campos para cada grupo de varianza:

  Nombre del Grupo

  Factor de Referencia − Este campo muestra cuanto contribuye cada grupo de varianza al factor de referencia de la red. Cada grupo de varianza tiene sus propios errores estimados, y por lo tanto sus propios factores de referencia.

  Número de Redundancia − Este campo muestra el grado de redundancia que cada grupo de varianza contribuye a los grados de libertad de la red. Utilice este campo para revisar si un grupo de varianza carece de redundancia.

Estadísticas de Observaciones GPS Individuales

Se informan estos campos para observaciones GPS:

  Número de identificación (ID) de la Observación

  Factor de Referencia − Este campo muestra cuanto contribuye cada observación GPS al factor de referencia de la red. Cada observación GPS tiene sus propios errores estimados, y por lo tanto su propio factor de referencia.

  Número de Redundancia − Este campo muestra el grado de redundancia que cada grupo de varianza contribuye a los grados de libertad de la red. Un número grande indica mayor redundancia. Utilice este campo para revisar si un grupo de varianza carece de redundancia.


Estadísticas de Observaciones Terrestres

Visión de Conjunto

Para revisar el factor de referencia y número de redundancia (grados de libertad) determinados por observaciones terrestres, utilice el resumen de Estadísticas de Observaciones Terrestres de las estadísticas para los tipos de observación.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de Ajuste de Red. Se inicia el visor HTML por defecto y aparece el informe de Ajuste de Red con la Cabecera de Ajuste en la parte superior..

2.	Del Indice de Materias al lado izquierdo de la pantalla, haga clic en Resumen Estadístico −Observación Terrestre.

Aparece la sección de Estadísticas de Observaciones Terrestres.

Los siguientes campos son informados:

Factor de Referencia

Cada tipo de observación tiene su propio error estimado, y por lo tanto su factor de referencia. Este valor le muestra cuánto contribuye cada tipo de observación al factor de referencia de la red. El software Trimble Geomatics Office le permite trabajar separadamente con cada método de observación (GPS, terrestre, o de geoide) para ponderar cada grupo de observación independientemente. Puede luego aplicar la cantidad apropiada de escalamiento a las estimaciones de error para cada grupo.

Número de Redundancia

El número de redundancia, a veces llamado grados de libertad, es un indicador de cuanto contribuye cada observación a la redundancia general. Utilice esta estadística para revisar cuales son las observaciones que carecen de redundancia.

Estadísticas Terrestres por Tipo

Si los siguientes tipos de observación están presentes en el ajuste, entonces se muestran sus factores de referencia y números de redundancia:

  Angulos Horizontal

  Elevaciones Trigonométricas

  Distancias de Elipsoide

  Incrementos de Elevación

  Acimutes

Estadísticas del Grupo de Varianza Terrestres

Se informan los siguientes campos para cada grupo de varianza:

  Nombre del Grupo

  Factor de Referencia − Este campo muestra cuanto contribuye cada observación GPS al factor de referencia de la red. Cada observación GPS tiene sus propios errores estimados, y por lo tanto su propio factor de referencia.

  Número de Redundancia − Este campo muestra el grado de redundancia que cada grupo de varianza contribuye a los grados de libertad de la red. Utilice este campo para revisar si un grupo de varianza carece de redundancia.


    Estadísticas del modelo geoidal

Más información

 Véase también

Visión de Conjunto

Utilice el resumen de Estadísticas de observaciones de geoide de las Estadísticas de tipos de observaciones para conocer el factor de referencia y el número de redundancias (grados de libertad) determinados para las observaciones de geoide.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Resumen Estadístico − Modelo Geoidal.

Las Estadísticas modelo geoidal aparecen.

Se presentan los siguientes campos:

Factor de referencia

Cada tipo de observación tiene sus propios errores estimados y, por ello, su propio factor de referencia (FR). Este  valor muestra cuánto contribuye cada tipo de observación al factor de referencia de la red. El software Trimble Geomatics Office permite trabajar con cada método de observación (GPS, terrestre, o de geoide) separadamente, para ponderar independientemente cada grupo de observaciones y luego aplicar la adecuada cantidad de escala a las estimaciones del error de cada grupo.

Número de redundancias

El Número de redundancias, llamado a veces grados de libertad, es un indicador de cuánto contribuye cada observación a la redundancia general. Utilice estas estadísticas para identificar qué observaciones carecen de redundancias.


    Observaciones GPS ajustadas

Más información

 Véase también

Visión de Conjunto

Utilice las observaciones en la tabla Observaciones GPS ajustadas para:

  Verificar el número de observaciones GPS utilizadas en el ajuste.

  Evaluar los errores normalizados a posteriori de cada componente de observación.

  Identificar aquellos componentes de observaciones GPS que excedan del valor Tau crítico definido para la red (periféricos). Las observaciones sospechosas (periféricos) se resaltan en rojo para ayudar a identificar los periféricos.

  Identificar cualquier transformación inesperada y valores estimados con errores grandes en los parámetros.

Los siguientes campos pueden preceder a la tabla Observaciones GPS ajustadas:

NOTA: Los campos Parámetros transformación se presentan tomando como base el estado del parámetro. El estado del parámetro producirá la presentación de los siguientes valores:

Sin usar − Un parámetro configurado en estado sin usar dará como resultado valores no presentados.

Definido por usuario − Un parámetro configurado en estado definido por usuario aparecerá como el valor fijado por el usuario con independencia del número de componentes de coordenadas limitadas.

Calculado − Un parámetro configurado en estado calculado aparecerá después de limitar el número de componentes de coordenadas requerido.

Para más información acerca de la definición y cálculo de los parámetros de transformación, véase Parámetro de transformación - Visión de conjunto.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Observaciones ajustadas− GPS.

Se mostrarán las estadísticas de observaciones ajustadas.

Se incluyen las siguientes estadísticas:

Grupo de transformación GPS

Este campo muestra el nombre de cada grupo de transformación incluido en el ajuste. Este campo sirve también como cabecera para distinguir una de otra la información presentada para cada grupo de transformación.

Desvío en longitud

Estos campos muestran el valor del parámetro Desvío en longitud y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

NOTA: Esto varía de un grupo de transformación de geoide, en el que se fijan unos requisitos mínimos de seis alturas (3 alturas ortométricas y 3 de elipsoide) y un punto 2D.

Desvío en latitud

Estos campos muestran el valor del parámetro Desvío en latitud y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

NOTA: Esto varía de un grupo de transformación de geoide, en el que se fijan unos requisitos mínimos de seis alturas (3 alturas ortométricas y 3 de elipsoide) y un punto 2D.

Rotación de acimut

Estos campos muestran el valor del parámetro Rotación de acimut y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

Escala de la red

Estos campos muestran el valor del parámetro Escala de la red y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

Escala de distancia

Estos campos muestran el valor del parámetro Escala de distancia y el error estimado. Este valor se utiliza para eliminar un error sistemático en las distancias.

Constante de distancia

Estos campos muestran el valor del parámetro Constante de distancia y el error estimado. Este valor se utiliza para eliminar un error sistemático en las distancias.

Constante de altura

Estos campos muestran el valor del parámetro Constante de altura y el error estimado. Este parámetro elimina el error de altura del sistema.

Número de observaciones

Este campo muestra el número total de observaciones GPS incluidas en el ajuste.

Número de periféricos

Este campo muestra el número total de periféricos (observaciones GPS con altos residuales) encontrados en el ajuste.

Ajuste de observaciones (Tau crítico = #)

Este campo muestra valor de Tau crítico utilizado en el ajuste. Este campo va seguido inmediatamente por la tabla Observaciones GPS ajustadas.

En la tabla Observaciones GPS ajustadas se incluyen las siguientes columnas:

Columna	Lo que muestra
ID de la observación	Esta columna muestra el nombre de registro asignado a la observación en el proyecto. Para observaciones GPS, el número del ID va precedido por el carácter "B".
Desde punto	Esta columna muestra el nombre del punto inicial.
Al punto	Esta columna muestra el nombre del punto final.
Observaciones	Esta columna listan los valores ajustados para los componentes de la observación GPS.
Error a posteriori (Valor sigma)	Estos campos listan el error estimado a posteriori para los componentes de las observaciones GPS. En la cabecera de la columna se presenta el escalar sigma configurado en el Estilo de ajuste.
Residual	Estos tres campos listan el residual de la observación para los componentes de la observación GPS.
Residual est.	Este campo muestra el residual normalizado para los componentes de la observación GPS. El residual normalizado permite comparar directamente los errores de una medición angular con los errores de una medición lineal.


Observaciones Terrestres Ajustadas

Más información

 Véase también

Visión de conjunto

Utilice las observaciones en la tabla de Observaciones Terrestres Ajustadas para hacer lo siguiente:

  Verificar el número de observaciones terrestres utilizadas en el ajuste.

  Evaluar los errores estándar a posteriori de cada componente de observación.

  Identificar aquellas componentes de observaciones terrestres que sobrepasan el Tau crítico definido para los periféricos de la red. Se resaltan en rojo las observaciones sospechosas para ayudar a identificar los periféricos.

  Identificar las transformaciones inesperadas y las estimaciones de errores grandes en los parámetros.

Estos campos pueden preceder a la tabla de Observaciones Terrestres Ajustadas:

NOTA: Se informa acerca de los campos  Parámetros de transformación en base al estado del parámetro. El estado del parámetro produce los siguientes valores:

  Sin utilizar − no da valores informados

  Definido por el usuario − aparece como el valor configurado por el usuario, independientemente del número de componentes de coordenadas limitadas.

  Calculadas − aparecerá después de limitar el número requerido de componentes de coordenadas.

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de Ajuste de Red. Se inicia el visor HTML por defecto y aparece el informe de Ajuste de Red con la Cabecera de Ajuste en la parte superior.

2.	Del Indice de Materias al lado izquierdo de la pantalla, haga clic en Observaciones Ajustadas − Terrestes. Se muestran las estadísticas de Observaciones Ajustadas.

Se incluyen las siguientes estadísticas:

Grupo de Transformación Terrestre

Este campo muestra el nombre de cada grupo de transformación incluido en el ajuste. Este campo sirve también como cabecera para distinguir una de otra la información presentada para cada grupo de transformación.

Desvío en longitud

Estos campos muestran el valor del parámetro Desvío en longitud y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

NOTA: Esto varía de un grupo de transformación de geoide, en el que se fijan unos requisitos mínimos de seis alturas (3 alturas ortométricas y 3 de elipsoide) y un punto 2D.

Desvío en latitud

Estos campos muestran el valor del parámetro Desvío en latitud y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

NOTA: Esto varía de un grupo de transformación de geoide, en el que se fijan unos requisitos mínimos de seis alturas (3 alturas ortométricas y 3 de elipsoide) y un punto 2D.

Rotación de acimut

Estos campos muestran el valor del parámetro Rotación de acimut y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

Escala de la red

Estos campos muestran el valor del parámetro Escala de la red y el error estimado. Este valor se calcula y se presenta cuando se fijan un mínimo de tres alturas y un punto 2D.

Escala de distancia

Estos campos muestran el valor del parámetro Escala de distancia y el error estimado. Este valor se utiliza para eliminar un error sistemático en las distancias.

Constante de distancia

Estos campos muestran el valor del parámetro Constante de distancia y el error estimado. Este valor se utiliza para eliminar un error sistemático en las distancias.

Constante de altura

Estos campos muestran el valor del parámetro Constante de altura y el error estimado. Este parámetro elimina el error de altura del sistema.

Número de observaciones

Este campo muestra el número total de observaciones GPS incluidas en el ajuste.

Número de periféricos

Este campo muestra el número total de periféricos (observaciones GPS con altos residuales) encontrados en el ajuste.

Ajuste de observaciones (Tau crítico = #)

Este campo muestra valor de Tau crítico utilizado en el ajuste. Este campo va seguido inmediatamente por la tabla Observaciones GPS ajustadas.

En la tabla Observaciones GPS ajustadas se incluyen las siguientes columnas:

Columna	Lo que muestra
ID de la observación	Esta columna muestra el nombre de registro asignado a la observación en el proyecto. Para observaciones terrestres, el número del ID va precedido por el carácter "T".
Punto visual hacia referencia	Esta columna muestra el nombre del punto visual hacia la referencia.
Punto Ocupado	Esta columna muestra el nombre del punto ocupado.
Punto visual adelante	Esta columna muestra el nombre del punto visual adelante.
Observación	Esta columna listan los valores ajustados para los componentes de la observación terrestre.
Error a posteriori (Valor sigma)	Estos campos listan el error estimado a posteriori para las componentes de las observaciones terrestres. En la cabecera de la columna se presenta el escalar sigma configurado en el Estilo de ajuste.
Residual	Esta columna muestra el residual de la observación para las componentes de observación terrestre.
Residual est.	Este campo muestra el residual normalizado para los componentes de la observación terrestre. El residual normalizado permite comparar directamente los errores de una medición angular con los errores de una medición lineal.


 Observaciones de geoide ajustadas

Más información

 Véase también

Visión de Conjunto

Utilice estas estadísticas para examinar esta información acerca de las observaciones de geoide ajustadas:

  Valor Tau crítico utilizado en el ajuste

  Observaciones de geoide con sus errores normalizados asociados (estimados) a posteriori, residual, y residuales normalizados.

  Observaciones de geoide señaladas en rojo como periféricas

  Parámetros de transformación con sus errores estimados asociados (ajuste totalmente limitado.

  Un resumen de las observaciones de geoide utilizadas en el ajuste y una tabla que contiene información acerca de todas las observaciones de geoide.

Utilice las observaciones en la tabla Observaciones de geoide ajustadas para:

  Verificar el número de observaciones de geoide utilizadas en el ajuste.

  Evaluar los errores normalizados a posteriori de cada observación.

  Identificar aquellas observaciones de geoide que excedan del valor Tau crítico definido para la red (periféricos). Las observaciones sospechosas se resaltan en rojo para ayudar a identificar los periféricos.

  Identificar cualquier transformación inesperada y valores estimados con errores grandes en los parámetros.

Los siguientes campos pueden preceder a la tabla Observaciones de geoide ajustadas:

NOTA: Los campos Parámetro transformación se presentan tomando como base el estado del parámetro. El estado del parámetro producirá la presentación de los siguientes valores:

Sin usar – Un parámetro configurado en estado sin usar dará como resultado valores no presentados.

Definido por usuario – Un parámetro configurado en estado definido por usuario aparecerá como el valor fijado por el usuario independientemente del número de componentes de coordenadas limitadas.

Calculado – Un parámetro configurado en estado calculado aparecerá después de limitar el número de componentes de coordenadas requerido.

Para más información acerca de la definición y cálculo de los parámetros de transformación, véase Parámetro de transformación – Visión de conjunto (hipervínculo).

Para acceder a estas estadísticas:

1.	Seleccione Informes / Informe de ajuste de redes. Se iniciará el visor por defecto HTML y aparecerá el informe de ajuste de redes con la Cabecera del ajuste en su parte superior.

2.	En el Indice de materias al lado izquierdo de la pantalla, haga clic en Observaciones ajustadas− Geoide. Se mostrarán las estadísticas de observaciones de geoide ajustadas.

Se incluyen las siguientes estadísticas:

Grupo de transformación de geoide

Este campo muestra el nombre del grupo de transformación de geoide incluido en el ajuste. Dado que el grupo de transformación existe, esta parte del informe mostrará siempre el grupo de transformación <Valor por defecto del geoide>.

Desvío en longitud

Estos campos muestran el valor del parámetro Desvío en longitud y el error estimado. Para los grupos de transformación de geoide, este valor se calcula y se presenta cuando se fijan un mínimo de seis alturas (3 alturas ortométricas y 3 de elipsoide) y un punto 2D. Esto varía de un grupo de transformación GPS, en el que se fijan unos requisitos mínimos de tres alturas y un punto 2D.

Desvío en latitud

Estos campos muestran el valor del parámetro Desvío en latitud y el error estimado. Para los grupos de transformación de geoide, este valor se calcula y se presenta cuando se fijan un mínimo de seis alturas (3 alturas ortométricas y 3 de elipsoide) y un punto 2D. Esto varía de un grupo de transformación GPS, en el que se fijan unos requisitos mínimos de tres alturas y un punto 2D.

Constante de altura

Estos campos muestran el valor del parámetro Constante de altura y el error estimado. Este valor se calcula y presenta cuando se fija un mínimo de una elevación y una altura.

NOTA: Los parámetros Rotación de acimut, Escala de la red, Escala de distancia y Constante de distancia no se utilizan al transformar alturas de geoide.

Número de observaciones

Este campo muestra el número total de observaciones de geoide incluidas en el ajuste.

Número de periféricos

Este campo muestra el número total de periféricos (observaciones de geoide con grandes residuales) encontrados en el ajuste.

Ajuste de observaciones (Tau crítico = #)

Este campo muestra valor de Tau crítico utilizado en el ajuste. Este campo va seguido inmediatamente por la tabla Observaciones de geoide ajustadas.

En la tabla Observaciones de geoide ajustadas se incluyen las siguientes columnas:

Columna	Lo que muestra
ID de la observación	Este campo muestra el nombre de registro asignado a la observación de geoide en el proyecto. Para observaciones de geoide, el número del ID va precedido por el carácter "G".
Nombre de punto	Este campo muestra el nombre de los puntos utilizados para extraer observaciones de geoide del modelo geoidal.
Separación	Este campo muestra el valor ajustado para cada observación de geoide.
Error a posteriori (Valor sigma)	Estos campos muestran el error estimado a posteriori para los componentes de la observación de geoide. En la cabecera de la columna se presenta el escalar sigma configurado en el estilo de ajuste.
Residual	Estos campos muestran el residual de la observación.
Residual est.	Este campo muestra el residual normalizado para cada observación de geoide. El residual normalizado permite comparar directamente los errores de una medición angular con los errores de una medición lineal.
NOTA: Si se calculan correlaciones para el geoide, entonces todas las separaciones ajustadas tendrán residuales. Si no se calculan correlaciones, entonces sólo los puntos con limitaciones verticales tendrán residuales de geoide.


Configuraciones de Estilos de Ajuste

Visión de conjunto

En esta sección del informe, se puede ver un resumen de las configuraciones que fueron hechas para el ajuste de redes. Para acceder a las configuraciones de estilos de ajuste:

1.	Seleccione Informes /  Informe de Ajuste de Red. Se iniciará el visor HTML por defecto y aparece el informe de Ajuste de Red en la parte superior de la Cabecera del Ajuste.

2.	Del Indice de Materias al lado izquierdo de la pantalla, haga clic en Configuraciones de Estilos de Ajuste.

Se muestran las siguientes configuraciones de estilos de ajuste:

Tolerancias Residuales

Se muestran las configuraciones de tolerancias residuales para los siguientes valores:

  Para finalizar iteraciones

  Corte de Convergencia Final

Presentación de Covarianza

Se muestran los siguientes Parámetros de Error Horizontal:

  Error Lineal Propagado [E]

  Término Constante [C]

  Escala en Error Lineal [S]

Se muestra la siguiente información relacionada con los parámetros tridimensionales:

  Error Lineal Propagado [E]

  Término Constante [C]

  Escala en Error Lineal [S]

Esta sección también muestra si ha seleccionado la opción Utilizar errores de elevación si está disponible.

Controles de Ajuste

Se muestra la siguiente información:

  Cálculo de correlaciones para el geoide

  Se muestra si se ha llevado a cabo un ajuste horizontal o vertical (o ambos).

NOTA: Sólo se muestra esta sección si el ajuste incluye observaciones terrestres.

Errores de Configuración

Se muestran los siguientes errores de instalación GPS:

  Error en la Altura de la Antena

  Error de Centrado

Se muestran los siguientes errores de instalación terrestre:

  Error en la Altura del Instrumento

  Error de Centrado

NOTA: Los errores de instalación terrestres sólo se enumeran si las observaciones terrestres se incluyen en el ajuste.

Para más información acerca de las configuraciones de Errores de Instalación véase Errores de Instalación.


Diálogo de configuración del informe de ajuste de red

Visión de Conjunto

Utilice este diálogo para seleccionar la información que se muestra en el informe de Ajuste de Red.

Para hacer esto:

  Seleccione Informes / Configuración / Informe de Ajuste de Red. Aparece el diálogo de configuración del informe de ajuste de red.

Los elementos que se pueden mostrar en el informe de Ajuste de Red son:

  Estadísticas de Observaciones GPS individuales

  Coordenadas de Cuadrículas Ajustadas

  Coordenadas Geodésicas Ajustadas

  Incrementos de Coordenadas

  Comparaciones de Coordenadas de Control

  Elipses de Error de Punto

  Términos Covariantes

NOTA: Para proyectos de gran magnitud, el generar presentaciones de Elipses de Punto de Error y Términos Covariantes quita mucho tiempo. Inhabilite estas opciones en el diálogo de configuración del informe de ajuste de red para generar informes en forma más expedita.


Comparaciones de Coordenadas de Control

Visión de Conjunto

Si lleva a cabo un ajuste en un punto que tiene coordenadas sin restricciones con calidad de Control, el  informe de Ajuste de la Red muestra la diferencia entre las coordenadas sin restricciones de control de los puntos y las coordenadas ajustadas de control de los puntos.

Para ver las comparaciones de coordenadas de control:

1.	Seleccione Informes / Informe de Ajuste de Red. Se inicia el visor HTML y aparece el informe de Ajuste de Red con la Cabecera de Ajuste en la parte superior.

2.	Del Indice de Materias al lado izquierdo de la pantalla, haga clic en Comparaciones de Coordenadas de Control.

Las comparaciones de coordenadas de control se muestran en una tabla con los siguientes campos:

Nombre del Punto

Este campo muestra el nombre del punto con calidad de control.

Valores de Incremento

La diferencia entre las coordenadas de control sin restricciones y las coordenadas de control ajustadas se muestran para:

  Incremento Norte

  Incremento Este

  Incremento Elevación

  Incremento Altura

NOTA: Las diferencias se muestran como:

Diferencia de coordenadas de control = coordenada de control − Coordenada de Ajuste


    Comando Ajustar

Más información

Cómo...	Véase también
Visión de Conjunto

Seleccione este comando para realizar un ajuste de redes.

Antes de utilizar este comando, asegúrese de que son correctas todas las Configuraciones de estilos de ajuste, de que se han definido las coordenadas del  punto de control  y de que están disponibles las observaciones.

Para realizar un ajuste, use una de las siguientes alternativas:

  Seleccione Ajuste / Ajustar.

  Pulse F10.

Comenzará el ajuste.

Tras cada iteración de ajuste se calcula un residual de la observación mediante dos rutinas de software distintas. La diferencia de los dos cálculos se comparan con la tolerancia A iteraciones finales. Basándose en esta comparación tiene lugar una de las siguientes acciones:

 Si la diferencia entre los residuales de observaciones calculados es menor que la tolerancia A iteraciones finales, las iteraciones de ajuste finalizan. En el Informe de ajuste de redes se incluye el siguiente mensaje: “Ajuste logrado en ## iteraciones”, donde ## indica el número de iteraciones que se han necesitado para la convergencia de la red.

 Si la diferencia entre los residuales de observaciones calculados es mayor que la tolerancia A iteraciones finales, las iteraciones de ajuste continúan. Si el ajuste continúa hasta alcanzar el máximo de iteraciones se utiliza el Límite de convergencia final (véase a continuación).

Introduzca la tolerancia límite de convergencia para la iteración final del ajuste de la red. El software utiliza este valor para determinar si se ha logrado el ajuste de la red cuando la iteración final no pasa la tolerancia A iteraciones finales.

 Si la diferencia calculada en los residuales de observaciones para la última iteración del ajuste es mayor que la tolerancia A iteraciones finales, el residual se compara con el Límite de convergencia final y se realiza una de las siguientes acciones:

 Si la diferencia entre los residuales de observaciones calculados es menor que el Límite de convergencia final, se habrá logrado el ajuste y se mostrará el siguiente mensaje “Convergencia final lograda tras ## iteraciones (se ha utilizado límite de convergencia final)”, donde ## indica el número de iteraciones que se han necesitado para la convergencia de la red.

 Si el residual de observaciones es mayor que el Límite de convergencia final, el ajuste falla y aparecerá el siguiente diálogo aviso: “El ajuste ha fallado. No hay convergencia”.

Para más información acerca del proceso de ajuste de redes, véase Ajuste de redes.

Para más información acerca de las iteraciones y de los cálculos realizados durante el proceso, véase Tolerancias residual.


    Comando Estilos de ajuste

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para ver, crear, copiar, editar, renombrar, y eliminar estilos de ajuste.

Para ver el diálogo Estilos de Ajuste de Redes:

  Seleccione Ajuste / Estilos de ajuste.


    Comando Datum

Más información

Cómo ...	Véase también
Visión de Conjunto

Seleccione este comando para elegir el datum usados en el ajuste.

Para ver el submenú:

  Seleccione Ajuste / Datum.

Aparecerá el submenú Datum con estos comandos:

  WGS-84

  Datum del proyecto


    Comando Grupos de observación

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para definir los grupos de varianza y de transformación usados en el ajuste.

Para ver el submenú Grupos de observación:

  Seleccione Ajuste / Grupos de observación.

Aparecerá el submenú Grupos con estos comandos:

  Grupos de varianza

  Grupos de transformación


    Comando Informe de ajuste de redes

Más información

Cómo ...	Informe	Véase también
Visión de Conjunto

Seleccione este comando para ver el informe de Ajuste de redes.

Para ver el informe de ajuste de redes:

  Seleccione Informes / Informe de ajuste de redes.

El informe se genera en formato HTML y el visor HTML por defecto para la computadora se inicia automáticamente para mostrar los datos del informe.

Para más información acerca del informe, véase informe de ajuste de redes.


    Comando Observaciones

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para ver y evaluar las observaciones. Este comando también le permite incluir o excluir observaciones del ajuste de redes.

Para ver el diálogo Observaciones:

  Seleccione Ajuste / Observaciones.


    Comando Puntos

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para abrir el diálogo Puntos, con opciones para ver, configurar y borrar el estado Fijo de los componentes de las coordenadas de los puntos de control usados en una ajuste de redes:

Para ver el diálogo Puntos:

  Seleccione Ajuste / Puntos.


    Comando Datum del proyecto

Más información

Cómo ...	Véase también
Visión de Conjunto

Seleccione este comando para elegir el datum del proyecto como datum utilizado en el ajuste. El datum del proyecto se define en la ficha Sistemas de coordenadas del diálogo Propiedades del proyecto. El datum del proyecto se usa cuando se realiza un ajuste totalmente limitado, o un ajuste mínimamente limitado sobre datos terrestres.

Para seleccionar datum del proyecto:

  Seleccione Ajuste / Datum / Datum del proyecto − <datum>. Junto al datum del proyecto aparecerá una marca de verificación − <datum>.


    Comando Quitar Ajuste

Más información

Cómo ...	Véase también
Visión de Conjunto

Seleccione este comando para quitar el ajuste actual.

Para quitar los valores ajustados:

  Seleccione Ajuste / Quitar Ajuste.

Use está opción para reestablecer la configuración previa de la red antes del ajuste. Por ejemplo, cuando utilice este comando:

  el datum se configura a WGS-84

  no hay puntos con estado fijo

  se quitan las elipses de error

  se descargan las observaciones del geoide

  se reestablecen los escalares a Todas las Observaciones y opciones por defecto

NOTA: No se reestablecen a su estado previo las observaciones que fueron inhabilitadas para ser ajustadas, ni todas aquellas para las que se despejó la casilla de verificación de Uso en ajuste de red.


    Comando Grupos de transformación

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para definir los grupos de transformación de las observaciones usadas en el ajuste.

Para ver el diálogo Grupos de Transformación:

  Seleccione Ajuste / Grupos de observación / Grupos de transformación.


    Comando Grupos de varianza

Más información

Cómo ...	Diálogo	Véase también
Seleccione este comando para definir los grupos de varianza de las observaciones usadas en el ajuste.

Para ver el diálogo Grupos de Varianza :

  Seleccione Ajuste / Grupos de observación / Grupos de varianza.

Aparecerá el diálogo Grupos de varianza.


    Comando WGS-84

Más información

Cómo ...	Véase también
Visión de Conjunto

Seleccione este comando para utilizar WGS-84 como el datum en el ajuste.  El datum WGS-84 debe usarse al realizar un ajuste mínimamente limitado sobre observaciones GPS.

Para seleccionar el datum WGS-84:

  Seleccione Ajuste / Datum / WGS-84. Junto a WGS-84 aparecerá una marca de verificación.


    Comando Estrategias de ponderación

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para mostrar el diálogo Estrategias de ponderación con opciones para definir y aplicar las estrategias de ponderación escalar usadas en el ajuste.

Para ver el diálogo Estrategias de ponderación:

  Seleccione Ajuste / Estrategias de ponderación.


    Comando Guardar (Coordenadas de calibración)

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para guardar las coordenadas de calibración tras realizar un ajuste GPS mínimamente limitado. Las coordenadas de calibración constan de las latitudes, longitudes y alturas sobre el elipsoide WGS-84 generadas durante el ajuste mínimamente limitado.

Estas coordenadas se utilizan como coordenadas GPS al realizar una calibración local con el software Trimble Geomatics Office.

Para ver el diálogo Guardar Coordenadas de Calibración:

  Seleccione Ajuste / Coordenadas de calibración / Guardar.

NOTA: Este comando no está disponible cuando se está utilizando el datum del proyecto para ajustar la red, o cuando hay datos terrestres en el ajuste.

NOTA: Cuando se guardan coordenadas de calibración, una coordenada de calibración WGS-84 es guardada para el punto.


    Comando Quitar (Coordenadas de calibración)

Más información

Cómo ...	Véase también
Visión de Conjunto

Las coordenadas de calibración son latitudes WGS-84, longitudes y alturas de elipsoide que son generadas durante un ajuste GPS mínimamente limitado sobre el datum WGS-84. Seleccione este comando para quitarlas del proyecto:

  Seleccione Ajuste / Coordenadas de calibración / Quitar.


    Comando Inhabilitar Observación

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando cuando desee inhabilitar totalmente una observación que aparece en la lista de observaciones de ajuste. La inhabilitación total de una observación la quita de la lista de Observaciones y ya no vuelve a utilizarse al realizar ajustes o recálculos.

NOTA: Inhabilitar una observación no es lo mismo que excluir una observación. Las observaciones excluidas siguen apareciendo en la lista de observaciones, pero no son procesadas durante los ajustes o recálculos.

Para inhabilitar una observación:

1.	Seleccione Ajuste / Observaciones. Aparecerá el diálogo Observaciones.

2.	Haga clic con el botón derecho sobre la observación que quiera inhabilitar y luego seleccione Inhabilitar observación.

La observación se quita de la lista de observaciones y no se vuelve a utilizar para ajustes o recálculos.

Las observaciones inhabilitadas no pueden ser re-habilitadas desde el diálogo Observaciones. En cambio, seleccione la observación y re-habilite sus propiedades deshabilitadas de la ventana de gráficos. La observación se re-habilita al cambiar su estado de deshabilitado a habilitado.


    Comando Coordenadas de Calibración

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

Seleccione este comando para mostrar un submenú con comandos para guardar y quitar coordenadas de calibración.

Para  acceder al submenú:

  Seleccione Ajuste / Coordenadas de Calibración.

Aparecerá un menú con los siguientes comandos:

  Guardar

  Quitar


    Diálogo Guardar Coordenadas de Calibración

Más Información

Cómo ...	Véase también
Visión de Conjunto

Utilice el diálogo Guardar Coordenadas de Calibración para seleccionar como se guardan  las coordenadas de calibración.

NOTA: Está opción sólo está disponible si el ajuste del datum se configura a WGS-84 y si sólo se han ajustado observaciones GPS.

Para acceder a esta opción:

  Seleccione Ajuste / Coordenadas de calibración / Guardar.

Guardar coordenadas para calibración de grupo incluye las siguientes opciones:

Puntos existentes

Si elige guardarlas bajo Puntos existentes, las coordenadas se guardan como una coordenada adicional llamada Conjunto de calibración.

Puntos nuevos con sufijo

Si elige guardarlas bajo Puntos nuevos con el sufijo: GPS, se crea un nuevo registro de punto con el nombre de punto "<Nombre de punto>-GPS". El sufijo ‘GPS’ se puede cambiar antes de guardar las coordenadas de calibración.

Para más información, véase Guardar las coordenadas de calibración.


    Barra de herramientas de Controles de elipse

Más información

Cómo ...	Véase también
Visión de Conjunto

La barra de herramientas de Control de elipse le permite filtrar las elipses de error, las flechas de error de altura y las flechas de error de elevación que aparecen en la ventana gráfica después de un ajuste. Los controles también le permiten aplicar una escala al tamaño de las elipses de error y ajustar el tamaño de las marcas.

Para ver la barra de herramientas de control de elipse:

  En la Vista del levantamiento, elija Vista / Barra de herramientas / Controles de elipse.

  En el área de la barra de herramientas en Vista del levantamiento, haga clic con el botón derecho y seleccione Controles de elipses.

Aparecerá la barra de herramientas de Control de elipse. Usted puede seleccionar de nuevo este comando para ocultar la barra de herramientas.

NOTA: También puede utilizar la ficha de Controles de Elipse en el cuadro de diálogo Ver opciones para controlar la forma en que se muestran los errores de elipse.

Estos botones de la barra de herramientas están disponibles:

	Este botón conmuta el comando Elipses de error. Conmutar este comando es equivalente a seleccionar y eliminar la casilla de verificación de Mostrar Elipses de Error de Punto y de Flechas, en el diálogo Opciones para Ver. Cuando este botón se cambia a activado están disponibles los comandos (botones) Error de Altura y Error de Elevación.
	Este botón conmuta el comando Error de Altura y sólo está disponible cuando está habilitado el comando Elipses de Error.
	Este botón conmuta el comando Error de Elevación y sólo está disponible cuando está habilitado el comando Elipses de Error.

Estos controles también están disponibles:

Escala de Elipse de error

La Escala de Elipse de error, mostrada abajo, controla el tamaño de las elipses de error que aparecen en la Ventana gráfica después de un ajuste.

Deslizando el contról al la izquierda se reduce el tamaño de la elipse y deslizándolo a la derecha se obtiene el efecto opuesto.

Tamaño de las marcas

Este control, mostrado abajo, ajusta la distancia de la escala de la barra de elipse de error.

Los botones de giro controlan la distancia entre las marcas que aparecen en la ventana Gráficos. La escala de barra se hace más larga cuando se aumenta el tamaño y la distancia entre las marcas se ajusta para coincidir con el valor que aparece en el Control de tamaño de marcas. Lo opuesto ocurre cuando se disminuye el valor de la escala de barra.


    Comando Controles de elipse

Más información

Cómo...	Véase también
Visión de Conjunto

Elija este comando para mostrar u ocultar la barra de herramientas de Control de Elipse.

Para mostrar ú ocultar la barra de herramientas de Control de Elipse:

 Seleccione Vista / Barra de herramientas / Control de elipse.

La barra de herramientas se muestra o se oculta cada vez que se ejecuta este comando.

NOTA: También puede configurar los controles de elipse de error desde la ficha Controles de Elipse de Error en el diálogo de Opciones para Ver.


    Comando Elipses de error

Más información

Cómo...	Véase también
Visión de Conjunto

El comando Elipses de error está disponible en la barra de herramientas de Controles de Elipse. Este comando filtra las Elipses de Error y Flechas que aparecen en la ventana Gráficos después de un ajuste. Cuando se selecciona este comando están disponibles los botones de comando de Errores de Altura y Elevación en la barra de herramientas.

NOTA: El comando Elipses de error es equivalente a seleccionar la casilla de verificación de Elipses de Error de Punto y Flechas en el diálogo Opciones para Ver. Al cambiar el estado de esta casilla de verificación cambia también la configuración actual del botón de Elipse de Error. Para más información, véase Filtrar Elipses de Error y Flechas.

Para seleccionar el comando Elipses de Error:

1. 	Vea la barra de herramientas de Controles de Elipse.

Para más información, véase Mostrar u ocultar la Barra de Herramientas de control de elipse.

2.	Para filtrar las Elipses de error y Flechas, pulse [image].

Las Elipses del Error se muestran o se ocultan, dependiendo de su estado original cuando se pulsó el botón. Cuando se selecciona el botón de Elipses de Error están disponibles los botones de Error de Altura y Error de Elevación. Si se seleccionan las barras de herramientas de Error de Altura y flecha de Error de Elevación, también se muestran las Flechas de Altura y/o Flechas de Elevación


    Comando Errores de Altura

Más información

Cómo...	Véase también
Visión de Conjunto

Seleccione este comando para filtrar las flechas de error de altura, que aparecen en la ventana Gráficos después de un ajuste.

NOTA: Para que este comando esté disponible debe seleccionarse antes el comando Elipse de error en la Barra de herramientas de Controles de elipse o la casilla de verificación de Mostrar Elipses de error de punto y Flechas en el diálogo Ver Opciones

Para seleccionar el comando de Errores de Altura:

1. 	Vea la barra de herramientas de Controles de Elipse.

2.	Para filtrar las Elipses de error y Flechas, pulse [image].

Las Elipses de error se muestran o se ocultan, dependiendo de su estado original cuando se pulsó el botón. Cuando se selecciona el botón de Elipses de Error se hace disponible el botón de Error de Altura.

3.	En la barra de herramientas de Control de Elipse, pulse [image].

Cada vez que se pulsa el botón se muestran o se ocultan las flechas de Altura.


    Comando Errores de elevación

Más información

Cómo...	Véase también
Visión de Conjunto

Seleccione este comando para filtrar las flechas de error de elevación, que aparecen en la ventana de gráficos después de un ajuste.

NOTA:  Para que este comando esté disponible debe seleccionarse antes el comando de Elipses de Error en la barra de herramientas de Controles de Elipse ó la casilla de verificación de Mostrar Elipses de Error de punto y Flechas en el diálogo Ver Opciones.

Para seleccionar el comando de Errores de Elevación:

1. 	Vea la barra de herramientas de control de Elipse.

Para más información, véase Mostrar ú ocultar la Barra de herramientas de Control de Elipse.

2.	Para filtrar las Elipses de Error y Flechas, pulse [image].

Las Elipses de Error se muestran o se ocultan, dependiendo de su estado original cuando se pulsó el botón. Cuando se selecciona el botón de Elipses de Error está disponible el botón de Error de Elevación .

3.	En la barra de herramientas de Control de Elipse, pulse [image].

Las Flechas de elevación se muestran o se ocultan cada vez que se pulsa el botón.


Mostrar u ocultar la Barra de herramientas de Controles de Elipse

 Visión de conjunto y Más Información

Visión de conjunto

La barra de herramientas de Controles de Elipse puede usarse para controlar el tamaño y la presentación de las elipses de error y flechas que aparecen en la ventana de gráficos.

Para ver la barra de herramientas de Controles de Elipse, seleccione una de las siguientes opciones:

  En Vista del levantamiento, seleccione Vista / Barra de herramientas / Controles de elipse.

  En el área de la barra de herramientas de la Vista del levantamiento , haga clic con el botón derecho y seleccione Controles de Elipse.

Aparecerá la barra de herramientas de controles de elipse.


Cambiar el tamaño de las elipses de error mostradas

Visión de conjunto

El tamaño de las Elipses de error que aparecen en la ventana Gráficos puede aumentarse ó disminuirse.

Para cambiar el tamaño de las Elipses de error mostradas:

1.	Vea la barra de herramientas de Control de Elipse la barra de herramientas de control de elipse.

Para más información, véase Mostrar ú Ocultar la Barra de herramientas de Control de Elipse.

2.	En la Escala de Elipse de Error, elija una de las siguiente opciones:

  Deslice la Escala de Elipse de Error hacia la izquierda para disminuir el tamaño de la Elipse.

  Deslice la Escala de Elipse de Error hacia la derecha para aumentar el tamaño de la Elipse.

Se ajustará el tamaño de las Elipses de Error.


Ajustar las marcas en la escala de barra de las Elipses de Error

Visión de Conjunto

La distancia de la marca de la escala de barra de las Elipses de Error puede ajustarse en la barra de herramientas de Controles de Elipse.

Para ajustar la distancia de la marca de la escala de barra de las Elipses de Error:

1.	Vea la barra de herramientas de control de Elipse.

Para más información, véase Mostrar ú Ocultar la Barra de herramientas de Control de Elipse.

2.	En control de Tamaño de Marcas, elija una de las siguientes opciones:

  Pulse el botón de giro inferior para disminuir la distancia de la marca de escala de la Elipse de Error.

  Pulse el botón de giro superior para aumentar la distancia de la marca de escala de Elipse de Error.

La escala de barra se hace más larga cuando se aumenta en tamaño y la distancia entre las marcas se ajusta para reflejar el valor que aparece en Tamaño de control de marcas. Lo opuesto es cierto cuando se disminuye el valor de la marca de la escala de barra.


Filtrar Elipses de error y Flechas

Más Información

Véase también	Cómo ...
Visión de conjunto

Las Elipses de error y Flechas que aparecen en la ventana Gráficos después de un ajuste, pueden filtrarse en la Barra de herramientas de Elipses de Error o en el diálogo Ver Opciones.

NOTA: La casilla de verificación de Mostrar Elipses de error de punto y Flechas en el diálogo Ver Opciones y el botón de Elipse de Error en la Barra de herramientas de Controles de Elipse están interrelacionados. El cambio de una especificación afecta al otro control. La utilización de la barra de herramientas de Controles de Elipse tiene ventajas adicionales. Para más información, véase Barra de herramientas de Controles de Elipse.

Para filtrar las elipses de error y flechas de la barra de herramientas de Controles de Elipse:

1.	Vea la barra de herramientas de Controles de Elipse.

2.	Para filtrar las Elipses de error y Flechas, pulse [image]. Las Elipses de error se muestran o se ocultan, dependiendo de su estado original cuando se pulsó el botón. Cuando se selecciona el botón de Elipses de Error, están disponibles los botones de Error de Altura y Error de Elevación. Si se seleccionan las barras de herramientas de flechas de Error de Altura y Error de Elevación, se muestran también las Flechas de Altura y/o Elevación.

3.	En la barra de herramientas de control de elipse, elija una, o las dos, opciones siguientes:

  Para filtrar las Flechas de altura, pulse [image].

  Para filtrar Flechas de elevación, pulse [image] .

Cada vez que se pulsa uno de estos botones se muestran u ocultan las flechas de altura ó elevación.

Para filtrar las elipses de error y flechas en el diálogo Ver Opciones:

1.	Seleccione Ver / Opciones. Aparecerá el diálogo Ver Opciones.

2.	Seleccione la ficha de Controles de Elipses de Error.

3. 	Seleccione la casilla de verificación de Mostrar Elipses de error de Punto y Flechas.

Cada vez que se selecciona la casilla de verificación se cambian a habilitadas ó inhabilitadas las Elipses de error y las Flechas.


Ventana Propiedades - Página estimación de error
    Ventana Propiedades − Página estimación de error

Más Información

 Véase también

Visión de Conjunto

La Página estimación de error muestra los errores de los puntos determinados tras un ajuste de red. Esta página sólo está disponible si se tiene instalado el módulo Ajuste de redes. Esta página de propiedades se puede ver tras realizar un ajuste.

Para ver la Página estimación de error:

1.	Haga doble clic sobre el punto que desee ver. Aparecerá la ventana Propiedades con el punto seleccionado.

2.	En la ficha de Levantamiento, haga clic en el botón de Estimación de error [image].

La página de Estimaciones de error aparece. Esta contiene los siguientes campos:

Norte, Este

Muestra los errores típicos en las componentes de coordenadas horizontales.

Elevación, Altura

Muestra los errores típicos en las componentes de coordenadas verticales.

Confianza

Muestra el nivel de confianza de los resultados de errores propagados.