Copyright: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.
Citation: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.


Bienvenido
El software DTMLink™ de Trimble del software Trimble Geomatics Office™ es un potente sistema de generación de modelos de superficies de curvas de nivel. Con este software se pueden crear nuevas superficies de curvas de nivel y editar las que se hayan creado con anterioridad. También puede importar superficies de curvas de nivel generadas a partir de otros paquetes de curvas de nivel.

El software tiene la capacidad de incluir límites y líneas de ruptura en el modelo de superficie de curvas de nivel, y permite características de edición de triángulos avanzada para ofrecer un mayor control sobre la formación del modelo.

A partir de dicho modelo de superficie se crea un modelo digital cuadriculado o triangular del terreno para su exportación a un colector de datos o un archivo de datos.

El software RoadLink™ puede utilizar el modelo creado para cálculos de volúmenes de tierra.

El software DTMLink le permite crear informes de volumen.

Algunas aplicaciones generales para las que se realizan cálculos de volumen son:

 cálculos de reservas (‘stockpile’)

 volúmenes de capas de materiales, tales como vetas de carbón

 volúmenes de huecos tales como los de los lagos creados como consecuencia de la construcción de presas

El software DTMLink utiliza el método de cálculo de volúmenes de prismas triangulares individuales. Estos quedan definidos por los planos triangulares que forman el modelo de superficie de curvas de nivel al utilizar las áreas de la base y las alturas medias de los prismas.

El software DTMLink le permite crear superficies de comparación. Una superficie de comparación es un modelo de superficie de curvas de nivel de la diferencia entre las dos superficies. Se la puede utilizar junto con el tipo de cálculo de volúmenes ‘Sobre una elevación’ para calcular los volúmenes de desmonte y terraplén entre las dos superficies.


Contenido

Hay los siguientes temas de ayuda disponibles:

1. Software DTMLink de Trimble

2. Comandos del menú

3. Sugerencias

4. Mensajes de error

5. Todos los temas

Se asume que está familiarizado/a con los conceptos básicos de Microsoft Windows. Consulte la documentación de Microsoft Windows pertinente si tiene alguna duda sobre la utilización de dicho software.


Todos los temas

En la sección Todos los temas del Contenido, todos los temas del presente sistema de ayuda se encuentran listados alfabéticamente.


Abrir superficie
Archivo / Abrir superficie

	Haga clic en la herramienta Abrir superficie de la barra de herramientas Estándar

Utilice este comando para abrir una superficie.

Superficies disponibles en

Seleccione un nombre de la lista mostrada en la parte inferior del diálogo Seleccionar superficie e introduzca dicho nombre en el campo que se encuentra debajo del campo Superficies disponibles. Si el nombre no está en la lista, haga clic en Carpeta.

NOTA: El campo Superficies disponibles en es de sólo lectura.

Carpeta

Haga clic en Carpeta para abrir el diálogo Buscar carpeta. Este le permite seleccionar la carpeta que contiene los archivos.

La carpeta por defecto es C:\Trimble Geomatics Office\Proyectos\xx\RoadLink – DTMLink …, donde xx es el nombre del proyecto.

SUGERENCIA: Cuando utilice el diálogo Buscar carpeta, busque siempre el archivo de superficie en el directorio de menor nivel.


Guardar superficie
Archivo / Guardar superficie

	Utilice la herramienta Guardar superficie de la barra de herramientas Estándar

Utilice este comando para guardar los cambios efectuados a la superficie actual.


Cerrar superficie
Archivo / Cerrar superficie

Utilice este comando para cerrar un archivo en el software DTMLink™.


Importar
Archivo / Importar

	Utilice la herramienta Importar de la barra de herramientas Estándar

Utilice este comando para importar el siguiente tipo de archivo al proyecto:

  Archivo Modelo digital del terreno TIN de Trimble (*.ttm)

  Archivo Modelo digital del terreno cuadriculado de Trimble (*.dtx)

  Superficie (TIN) del archivo de proyecto de TerraModel (*.pro)

  Superficie (TIN) de un archivo AutoCAD DXF

  Superficie del archivo LandXML (*.xml)

  Archivo de cuadrícula Paydirt/SiteWork (*.grd)

  Archivo Civilcad ASCII 5

  Archivo de superficie 12D

  Superficie del archivo InRoads

  Archivo TIN MX GENIO

  Archivo de superficie REB

  Puntos de cuadrícula GEOPAK


Archivo Modelo digital del terreno TIN de Trimble (*.ttm)

Use este comando para importar un archivo Modelo digital del terreno TIN de Trimble a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Archivo Modelo digital del terreno TIN de Trimble (*.ttm) y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

El campo Archivos de tipo muestra solamente el tipo Modelo digital del terreno TIN de Trimble (*.ttm). No se podrá cambiar el tipo de archivo en este campo.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Archivo Modelo digital del terreno cuadriculado de Trimble (*.dtx)

Use este comando para importar un archivo Modelo digital del terreno cuadriculado de Trimble a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	2.	En la lista de la ficha Superficie, seleccione Archivo Modelo digital del terreno cuadriculado de Trimble (*.dtx).

 	SUGERENCIA: Haga clic en el botón Configuración para quitar los puntos que definen la cuadrícula y que están dentro de una tolerancia especificada.

3.	Haga clic en Aceptar.

Aparecerá el diálogo Abrir.

4.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

El campo Archivos de tipo muestra solamente el tipo Modelo digital del terreno cuadriculado de Trimble (*.dtx). No se podrá cambiar el tipo de archivo en este campo.

5.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

6.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Configuración para importación de MDT cuadriculado

Use esta opción para quitar los puntos que definen la cuadrícula y que están dentro de la tolerancia especificada. Seleccione Decimar cuadrícula y, en el campo Tolerancia de decimación cuadrícula a TIN, especifique el valor de tolerancia.


Superficie (TIN) del archivo de proyecto de TerraModel (*.pro)

Use este comando para importar una Superficie (TIN) del archivo de proyecto de Terramodel a DTMLink:

NOTA: Para convertir un archivo Superficie (TIN) sin problemas, el archivo de proyecto de TerraModel deberá tener una red de triángulos en una capa.

Para importar el archivo:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Superficie (TIN) del archivo de proyecto de TerraModel (*.pro) y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir..

Si el archivo tiene solamente una capa, se importará la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.

Si el archivo de proyecto de TerraModel tiene más de una capa, aparecerá el diálogo Elegir capa de la superficie.

6.	Seleccione la capa o capas a importar. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Diálogo Elegir capa de la superficie

Use este diálogo para seleccionar la capa a convertir para la importación.

En la lista Capas, seleccione la capa a convertir en un archivo de superficie. Se podrán seleccionar varias capas para importar pero sólo se podrá mostrar una por vez.


Superficie (TIN) de un archivo AutoCAD DXF

Use este comando para importar una Superficie (TIN) de un archivo AutoCAD DXF a DTMLink.

NOTA: Para convertir un archivo Superficie (TIN) sin problemas, el archivo AutoCAD DXF deberá consistir en una red de triángulos de caras 3D o polilíneas 3D.

Para importar el archivo:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Si el archivo DXF se ha generado originalmente utilizando unidades distintas de las especificadas en el proyecto, haga clic en Configuración para configurar el archivo DXF.

Aparecerá el diálogo Opciones de configuración para importación de DXF/DWG. Use este diálogo para asignar unidades al archivo DXF que se está importando o convirtiendo. Deberá especificar las mismas unidades en las que el archivo DXF ha sido creado originalmente.

3.	Seleccione las correspondientes unidades para el archivo DXF.

4.	Haga clic en Aceptar en el diálogo Opciones de configuración para importación de DXF/DWG.

5.	5.	Haga clic en Aceptar en el diálogo Importar.

Aparecerá el diálogo Abrir.

6.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

El campo Archivos de tipo muestra solamente el tipo Archivo ASCII AutoCAD DXF (*.dxf). No se podrá cambiar el tipo de archivo en este campo muestra.

7.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

8.	Haga clic en Abrir.

Si el archivo tiene solamente una capa, se importará la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.

Si el archivo DXF tiene más de una capa, aparecerá el diálogo Elegir capa de la superficie.

9.	Seleccione la capa o capas a importar. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Diálogo Opciones de configuración para importación de DXF/DWG

Use este diálogo para configurar las unidades para importar una Superficie (TIN) a un archivo AutoCAD DXF.

Unidades del archivo DXF

Use este campo para asignar unidades al archivo DXF que está importando. Por ejemplo, si el proyecto de DTMLink utiliza Pies internacional como las coordenadas pero se ha generado un archivo *.dxf con Metros, entonces deberá especificar Metros en este grupo cuando importe dicho archivo *.dxf.

Para cambiar las unidades, seleccione en la siguiente lista desplegable:

  Metros (m)

  Pies internacional (ps)

  Pies topográficos USA (PS)

NOTA: Al importar una Superficie (TIN) de un archivo AutoCAD DXF, el campo Comprimir polilíneas no estará disponible.


Superficie del archivo LandXML (*.xml)

Use este comando para importar una superficie de un archivo LandXML a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Superficie del archivo LandXML (*.xml) y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Archivo de cuadrícula Paydirt/SiteWork (*.grd)

Use este comando para importar un archivo de cuadrícula SiteWork a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Archivo de cuadrícula Paydirt/SiteWork (*.grd).

SUGERENCIA: Haga clic en el botón Configuración para quitar los puntos que definen la cuadrícula y que están dentro de la tolerancia especificada.

2.	En el diálogo Importar, haga clic en Aceptar.

Aparecerá el diálogo Importar archivo de cuadrícula SiteWork.

3.	Haga clic en Examinar para buscar la carpeta que contiene el archivo que desea importar.

4.	En el campo Archivos, navegue al archivo de cuadrícula SiteWork requerido.

5.	Haga clic en Aceptar para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Diálogo Importar archivo de cuadrícula SiteWork

Use este diálogo para importar un archivo de cuadrícula SiteWork al software DTMLink.

Ubicación

Este campo muestra la ubicación del archivo de cuadrícula SiteWork.

Examinar

Haga clic en este botón para buscar la carpeta que contiene el archivo de cuadrícula SiteWork.

Archivos

Use este campo para seleccionar el archivo de cuadrícula SiteWork.

Aceptar

Haga clic en este botón para importar el archivo de cuadrícula SiteWork.

Cancelar

Haga clic en este botón para cancelar la operación de importación y regresar al diálogo Importar.


Archivo Civilcad ASCII 5

Use este comando para importar un archivo Civilcad ASCII 5 a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Archivo Civilcad ASCII 5 (*.AS5).

SUGERENCIA: Haga clic en el botón Configuración para quitar los puntos que definen la cuadrícula y que están dentro de la tolerancia especificada.

3.	Haga clic en Aceptar.

Aparecerá el diálogo Abrir.

4.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

5.	Haga clic en Abrir.

Aparecerá el diálogo Elegir capa de la superficie.

6.	Seleccione la capa que contiene la información sobre la cuadrícula.

7.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Archivo de superficie 12D

Use este comando para importar un archivo de superficie 12D a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Archivo de superficie 12D y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Superficie del archivo InRoads (*.tin)

Use este comando para importar una superficie de un archivo InRoads a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Superficie del archivo InRoads y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Archivo TIN MX GENIO

Use este comando para importar un archivo TIN MX GENIO (*.txt) a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Archivo TIN MX GENIO y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Puntos de cuadrícula GEOPAK

Use este comando para importar un Modelo digital del terreno cuadriculado (*.dtx) de un archivo GEOPAK a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	2.	En la lista de la ficha Superficie, seleccione Puntos de cuadrícula GEOPAK.

SUGERENCIA: Haga clic en el botón Configuración para quitar los puntos que definen la cuadrícula y que están dentro de la tolerancia especificada..

3.	Haga clic en Aceptar.

Aparecerá el diálogo Abrir.

4.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

El campo Archivos de tipo muestra solamente el tipo Todos los archivos (*.*). No podrá cambiar el tipo de archivo en este campo puesto que los archivos GEOPAK pueden tener cualquier extensión.

5.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

6.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Archivo de superficie REB

Use este comando para importar un archivo de superficie REB (*.reb) a DTMLink:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	En la lista de la ficha Superficie, seleccione Archivo de superficie REB y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

3.	En el campo Buscar en, elija la carpeta que contiene el archivo que desea importar. DTMLink le pedirá utilizar la carpeta de la cual ha importado un archivo por última vez.

4.	Seleccione una de las siguientes alternativas:

  Introduzca el nombre de archivo.

  Haga clic en el archivo requerido.

5.	Haga clic en Abrir para importar la superficie. Si ya existe una superficie con el mismo nombre en el proyecto, aparecerá el diálogo Importar superficie. Deberá renombrar la superficie que se está importando.


Importar superficie

Use el diálogo Importar superficie para nombrar la nueva superficie. Este diálogo aparecerá sólo si ya existe una superficie con el mismo nombre en el proyecto.

Nombre nueva superficie

El nombre de archivo es el nombre por defecto para la superficie. Use este campo para asignarle un nombre único a la superficie.


Exportar
Archivo / Exportar

	Use la herramienta Exportar en la barra de herramientas Estándar

Use este comando para exportar (o enviar) un archivo a un Survey Controller o dispositivo TDS o para crear un archivo.

NOTA: Los formatos para exportar que sacan los archivos ASCII siempre sacan datos numéricos de forma estándar, es decir sin separadores de miles y con un punto para las cifras decimales.

El diálogo Exportar muestra varios formatos para exportar disponibles. Las fichas del diálogo muestran los tipos de formatos para exportar.

Ficha Sistema

Use esta ficha para seleccionar en la lista de formatos disponibles:

Use este formato para exportar …	para crear …
MDT TIN al Trimble Survey Controller	Un archivo MDT triangular compatible de los puntos seleccionados para exportar directamente al software Trimble Survey Controller.
MDT TIN al archivo de Trimble Survey Controller (*.ttm)	Un archivo MDT triangular de los puntos seleccionados.
MDT cuadriculado al Trimble Survey Controller	Un archivo MDT cuadriculado compatible de los puntos seleccionados para exportar directamente al Trimble Survey Controller.
MDT cuadriculado a archivo de Trimble Survey Controller (*.dtx)	Un archivo MDT cuadriculado de los puntos seleccionados. Los valores del MDT cuadriculado que se sacan en un archivo ASCII siempre tendrán el formato de metros.
MDT TIN al Trimble 5600 TDS	Un archivo MDT triangular compatible de los puntos seleccionados para exportar directamente a un instrumento Trimble 5600 TDS.
MDT TIN al archivo de Trimble 5600 TDS (*.dtm)	Un archivo MDT triangular de los puntos seleccionados como un archivo de Trimble 5600 TDS (*.dtm) que un instrumento Trimble 5600 TDS que ejecuta TDS Survey Pro CE puede leer.
MDT TIN al TDS Survey Pro CE	Un archivo MDT triangular compatible de los puntos seleccionados para exportar directamente a un controlador TDS Survey Pro CE.
MDT TIN al archivo de TDS Survey Pro CE (*.dtm)	Un archivo MDT triangular de los puntos seleccionados que un controlador TDS Survey Pro CE puede leer.
Archivo AutoCAD DXF de caras 3D	un archivo ASCII DXF de caras 3D que puede leerse en software de terceros. Se escribe una entidad con caras 3D para cada uno de los triángulos del modelo de curvas de nivel.
Curvas a archivo AutoCAD DXF	un archivo ASCII DXF de las curvas de nivel que puede leerse en software de terceros. Haga clic en Configurar para especificar las opciones de salida.
 Véase también


MDT cuadriculado para el Trimble Survey Controller

Use este tipo para crear datos cuadriculados con las elevaciones de los puntos interpoladas a partir del modelo de curvas de nivel.

NOTA: El modelo digital cuadriculado del terreno (MDT) permite la interpolación de puntos de la cuadrícula Norte-Sur/Este-Oeste  a partir del modelo de curvas de nivel actual.

Utilice el comando Archivo / Exportar para crear un MDT cuadriculado para exportar al software Trimble Survey Controller™ versión 6.5 ó posterior.

Seleccione las opciones para exportar MDT cuadriculado al Trimble Survey Controller o MDT cuadriculado a archivo de Trimble Survey Controller.

Haga clic en Aceptar, y se mostrará una cuadrícula rectangular en la ventana gráfica. Esta cuadrícula rectangular muestra el rectángulo más pequeño que rodea totalmente a la superficie. Si se arrastran los límites de la misma se podrá definir el área deseada.

SUGERENCIA: Utilice los campos Izda, Arriba, Drcha, y Abajo del cuadro de grupo del diálogo Cuadrícula rectangular para delimitar con precisión el tamaño del rectángulo.

Los campos del diálogo Cuadrícula rectangular son:

Izda

Use Rellenar campo o introduzca valores para el este del lado izquierdo del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado izquierdo del rectángulo en la ventana gráfica.

Arriba

Use Rellenar campo o introduzca valores para el norte del lado superior del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado superior del rectángulo en la ventana gráfica.

Drcha

Use Rellenar campo o introduzca valores para el este del lado derecho del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado derecho del rectángulo en la ventana gráfica.

Abajo

Use Rellenar campo o introduzca valores para el norte del lado inferior del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado inferior del rectángulo en la ventana gráfica.

Tamaño cuadrícula

Utilice los campos de la ficha Tamaño cuadrícula para especificar el número de columnas y filas que forman la cuadrícula.

Columnas	Introduzca el número de columnas para la cuadrícula rectangular.
Filas	Introduzca el número de filas para la cuadrícula rectangular.
Estos campos usan el valor por defecto (10). De esta forma es posible tener una cuadrícula de forma rectangular.

NOTA: Cuando se cambie el número de columnas, filas o ambas en la ficha Tamaño cuadrícula, el software DTMLink™ calculará automáticamente los campos Altura y Anchura de la ficha Tamaño. Los campos actualizados muestran la nueva anchura y altura para cada tamaño.

Tamaño

Utilice los campos de la ficha Tamaño para especificar la anchura y altura de cada columna y fila que forma la cuadrícula.

Anchura	Introduzca un valor para la anchura de la columna.
Altura	Introduzca el valor para la altura de una fila.
NOTA: Cualquier cambio efectuado a la anchura, altura, o a ambos en la ficha Tamaño hará que se recalculen los campos Tamaño cuadrícula.

Aceptar

Haga clic en Aceptar para exportar la cuadrícula MDT. El archivo provee una lista de las coordenadas y elevaciones interpoladas de cada punto de la cuadrícula. Si se seleccionó la opción de exportación MDT cuadriculado al Trimble Survey Controller, podrá seleccionar el dispositivo en donde guardar el archivo.

NOTA: Los puntos de la cuadrícula que se encuentren dentro del límite del rectángulo pero fuera de la superficie de curvas de nivel no tendrán una elevación interpolada y en el informe figurarán como líneas en blanco.


MDT triangular para el Trimble Survey Controller

Use este tipo para crear datos triangulares basados en los puntos que definen los triángulos del modelo de curvas de nivel.

Para crear un MDT triangular para exportarlo al software Trimble Survey Controller™ versión 7.5 ó posterior:

1.	Seleccione Archivo / Exportar

2.	En el diálogo Exportar, seleccione una de las siguientes alternativas:

  MDT TIN al Trimble Survey Controller

  MDT TIN al archivo de Trimble Survey Controller

3.	Haga clic en Aceptar.

En la ventana gráfica, una cuadrícula muestra el rectángulo más pequeño que limita totalmente con la superficie. Al arrastrar los límites de la cuadrícula rectangular, podrá definir el área que desea.

SUGERENCIA: Use los campos Izda, Arriba, Drcha y Abajo en el cuadro de grupo del diálogo Alcance de TIN para delimitar con precisión el tamaño del rectángulo.

Izda

Use Rellenar campo o introduzca valores para el lado izquierdo (Oeste) del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado izquierdo del rectángulo en la ventana gráfica.

Arriba

Use Rellenar campo o introduzca valores para el lado superior (Norte) del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado superior del rectángulo en la ventana gráfica.

Drcha

Use Rellenar campo o introduzca valores para el lado derecho (Este) del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado derecho del rectángulo en la ventana gráfica.

Abajo

Use Rellenar campo o introduzca valores para el lado inferior (Sur) del cuadro medido en metros, pies internacionales, o pies topográficos estadounidenses. Este campo muestra el alcance del arrastre del lado inferior del rectángulo en la ventana gráfica.

Aceptar

Haga clic en Aceptar para exportar el MDT triangular. El archivo provee una lista de las coordenadas y elevaciones para cada triángulo. Si se seleccionó la opción para exportar MDT TIN al Trimble Survey Controller, podrá seleccionar el dispositivo en donde guardar el archivo.


MDT triangular para el Trimble 5600 TDS

Use este tipo para crear datos triangulares en función de los puntos que definen los triángulos del modelo de curvas de nivel.

Para crear un MDT triangular para exportarlo a un Trimble 5600 TDS:

1.	Seleccione Archivo / Exportar.

2.	En el diálogo Exportar, seleccione una de las siguientes alternativas:

  MDT TIN al Trimble 5600 TDS

  MDT TIN al archivo de Trimble 5600 TDS

3.	Haga clic en el botón Configurar para especificar las unidades del archivo exportado. Use esta opción para exportar el MDT TIN en unidades distintas de las del proyecto de DTMLink.

4.	Haga clic en Aceptar para exportar el MDT triangular.


MDT triangular para el TDS Survey Pro CE

Use este tipo para crear datos triangulares en función de los puntos que definen los triángulos del modelo de curvas de nivel.

Para crear un MDT triangular para exportarlo a un TDS Survey Pro CE:

1.	Seleccione Archivo / Exportar.

2.	En el diálogo Exportar, seleccione una de las siguientes alternativas:

  MDT TIN al TDS Survey Pro CE

  MDT TIN al archivo de TDS Survey Pro CE

3.	Haga clic en el botón Configurar para especificar las unidades del archivo exportado. Use esta opción cuando desea exportar el MDT TIN en unidades distintas de las del proyecto de DTMLink.

4.	Haga clic en Aceptar para exportar el MDT triangular.


Opciones MDT TIN de TDS para exportar

Use esta opción para exportar el MDT TIN en unidades distintas de las del proyecto de DTMLink. Seleccione la unidad correspondiente en la lista de Unidades archivo.


Renombrar superficie
Archivo / Renombrar superficie

Utilice este comando para renombrar el archivo de superficie actual.

Aparecerá el diálogo Renombrar superficie. Introduzca el nuevo nombre para la superficie actual en el campo.

Haga clic en Aceptar para renombrar la superficie actual.


Copiar superficie
Archivo / Copiar superficie

Use este comando para copiar el archivo de superficie actual.

Aparecerá el diálogo Copiar superficie.

Introduzca un nombre único para la nueva superficie..

Aceptar

Haga clic en Aceptar para copiar la superficie.


Eliminar superficie
Archivo / Eliminar superficie

Utilice este comando para eliminar una superficie.

Carpeta

Haga clic en Carpeta para abrir el diálogo Buscar carpeta. Este le permitirá navegar a la carpeta deseada.

Las superficies se almacenan en C:\Trimble Geomatics Office\Proyectos\xx\RoadLink - DTMLink …, donde xx es el nombre del proyecto.

SUGERENCIA: Utilice la papelera de reciclaje de Windows para recuperar archivos.


Salir
Archivo / Salir

Utilice este comando para cerrar la superficie actual y salir del software DTMLink™.


Menú Archivo

Utilice este menú para administrar las superficies. El menú contiene los siguientes comandos:

Abrir superficie

Guardar superficie

Cerrar superficie

Importar

Exportar

Renombrar superficie

Copiar superficie

Eliminar superficie

Salir


Archivo AutoCAD DXF de caras 3D

DTMLink crea un archivo ASCII DXF de caras 3D. Las coordenadas y elevación de cada uno de los vértices del triángulo se escribe al archivo en formato DXF.

Para exportar un archivo DXF de caras 3D:

1.	Utilice el comando Archivo / Exportar.

2.	2.	Seleccione la opción para exportar AutoCAD DXF de caras 3D.

3.	3.	Haga clic en Aceptar.

Aparecerá el diálogo Exportar caras 3D a archivo DXF.

4.	Introduzca un nombre de archivo en el campo Nombre de archivo.

5.	Haga clic en Guardar.

Por defecto este archivo se almacena en C:\Trimble Geomatics Office\Proyectos\xx\RoadLink – DTMLink …, donde xx es el nombre del proyecto.


Curvas a archivo AutoCAD DXF

Use esta opción para crear un archivo ASCII DXF de las curvas de nivel.

Para exportar un archivo de curvas de nivel DXF:

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione este formato para exportar para crear un archivo ASCII DXF de las curvas de nivel. Este archivo puede leerse y las curvas de nivel pueden mostrarse en el software Trimble Geomatics Office™ y en software de terceros.

3.	Haga clic en Configurar para especificar las opciones de salida.

Aparecerá el diálogo Opciones de curvas DXF.

4.	Seleccione una de las siguientes opciones:

  La opción Líneas rectas para exportar las curvas de nivel como líneas rectas

  La opción Segmentos lineales para exportar las curvas de nivel como segmentos lineales próximos a curvas.

5.	Especifique la longitud de segmento lineal máxima.

6.	Haga clic en Aceptar para confirmar la opción de salida.

Aparecerá el diálogo Exportar.

7.	Haga clic en Aceptar.

Aparecerá el diálogo Exportar curvas a archivo DXF.

8.	Introduzca un nombre de archivo.

9.	Haga clic en Guardar para exportar el archivo.

El archivo se almacena por defecto en C:\Trimble Geomatics Office\Proyectos\xx\RoadLink – DTMLink …, donde xx es el nombre del proyecto.


Opciones de curvas DXF

Use este diálogo para especificar las opciones de salida de curvas de nivel DXF.

Puede optar por exportar las líneas de las curvas como líneas rectas o segmentos lineales a las curvas próximas.

Si selecciona los segmentos lineales próximos a curvas, puede especificar la longitud del segmento lineal. Cuanto más corto el segmento lineal, mejor será la aproximación de la curva pero el archivo DXF consistirá en más puntos.


Diálogo Abrir

Este es el diálogo Abrir estándar:

1.	Busque la carpeta requerida.

2.	Seleccione el tipo de archivo.

3.	Seleccione el archivo.


Deshacer
Editar / Deshacer

	Haga clic en la herramienta Deshacer de la barra de herramientas Estándar
Use este comando o herramienta para deshacer la última modificación efectuada en la superficie. El texto del comando menú muestra la modificación realizada.


Menú Editar

Use este menú para deshacer la última modificación efectuada en la superficie.

Tiene el siguiente comando:

Deshacer


Temas de ayuda
Ayuda / Temas de ayuda

En el software DTMLink™ los comandos se agrupan en menús.

Los comandos del menú son:

Archivo

Editar

Ver

Diseño

Herramientas

Ventana

Ayuda


Acerca de
Ayuda / Acerca de

El comando Acerca de del menú Ayuda muestra el programa e información de derechos de autor del software DTMLink™.

NOTA: No se permite copiar este programa excepto para fines de archivación y copia de seguridad.

Esta información será necesaria si tiene algún problema o fallos que requieran apoyo técnico.


Consejo del día
Ayuda / Consejo del día

El sistema de sugerencias provee breves consejos útiles que le ayudan a utilizar el sistema con mayor facilidad. Si se selecciona esta opción se mostrará la siguiente sugerencia del día. Hay una casilla de verificación en el diálogo Consejo del día que podrá habilitar/inhabilitar para que se muestre o no una sugerencia cada vez que se inicia el sistema.


Menú Ayuda

El menú Ayuda provee información sobre el software DTMLink™. Tiene los siguientes comandos:

Temas de ayuda

Consejo del día

Acerca de


Utilización de las barras de herramientas

Las barras de herramientas proveen un acceso rápido y directo a los comandos del menú frecuentemente usados. Si mantiene el cursor sobre el botón de una herramienta en particular se mostrará una breve descripción de la misma en la barra de estado.

Por ejemplo, cuando mueva el cursor sobre el botón de la herramienta Incluir punto de la barra Superficie, en el panel de mensajes se mostrará “Incluye un punto en el modelo de superficie”.

Puede ocultar, mover, o cambiar el tamaño de cualquiera de las barras de herramientas y ordenarlas de la manera que más le convenga para trabajar.

Las barras de herramientas se fijan a cada lado de la ventana principal, en la zona superior del área de trabajo bajo los menús, o en la parte inferior del área de trabajo bajo la barra de estado. Alternativamente, las barras de herramientas pueden ponerse en cualquier lugar de la ventana y orientarse vertical u horizontalmente.

Para restaurar las configuraciones (o especificaciones) por defecto, presione el botón Restaurar en Ver / Barras de herramientas. (Si se hace doble clic en la barra de títulos de la barra de herramientas todas las barras de herramientas volverán a colocarse según las configuraciones por defecto.)

Sugerencias sobre las herramientas

Cuando se ubique el cursor sobre el botón de una herramienta, se mostrará una pequeña ventana llamada Sugerencia que le indicará la función de la herramienta. La breve descripción se muestra cerca del cursor y bajo la herramienta.

NOTA: Si se anclan las barras de herramientas se oculta la barra de títulos.

Las tres barras de herramientas son:

Barra de herramientas Estándar

Barra de herramientas Ver

Barra de herramientas Superficie


Barra de herramientas Estándar

Esta barra provee un acceso rápido a algunos de los elementos del menú principal.

Las herramientas disponibles en esta barra son:

Botón	Comando del menú	Descripción
	Archivo / Abrir superficie	Abre una superficie existente
	Archivo / Guardar superficie	Guarda los cambios en la superficie actual
	Archivo / Importar	Le permite importar una superficie de un paquete de software de terceros
	Archivo / Exportar	Le permite exportar datos a un Survey Controller, dispositivo TDS o archivo
	Editar | Deshacer	Deshace la última acción. El elemento del menú indica la operación que puede deshacerse.
	Ver/ Propiedades	Muestra la ventana Propiedades. Esta ventana muestra información en puntos de superficie, líneas de ruptura y límites.


Barra de herramientas Ver

Esta barra provee herramientas de navegación para ayudar a ver la ventana gráfica principal.

Las herramientas disponibles en esta barra son:

Botón	Comando del menú	Descripción
	Menú de acceso directo	La herramienta Seleccionar le permite seleccionar un punto de una superficie, línea de ruptura, o línea límite, además de ver la entidad seleccionada en la ventana Propiedades.
	Ver | Pan	Cambia el centro del área del zoom
	Ver | Acercar	Amplía la presentación al aumentar la escala.
	Ver | Alejar	Reduce la presentación al reducir la escala.
	Ver | Alcance del zoom	Cambia la escala de forma que la ventana muestre todas las entidades del proyecto actual.
	Ver | Zoom anterior	Muestra una vista de pantalla previa.
	Ver | Capas	Muestra u oculta capas diferentes.
	Ver | Ventana flotante	Abre la ventana flotante que muestra una vista a pequeña escala de las entidades de la vista actualmente seleccionada. Esta ventana puede cambiarse de tamaño y moverse.


Barra de herramientas Superficie

Esta barra provee las herramientas que le ayudarán a utilizar el software DTMLink™ más eficazmente.

Para asistir en la edición de una superficie la barra de herramientas Superficie ofrece las siguientes opciones:

Botón	Comando del menú	Descripción
	Diseño / Incluir punto	Incluye un punto en el modelo de superficie
	Diseño / Excluir punto	Excluye un punto en el modelo de superficie
	Diseño / Añadir línea	Quita zonas de la superficie que se encuentren fuera de un límite. Con esta herramienta, también se podrá definir un límite con una línea de ruptura.
	Diseño / Añadir línea	Quita una zona de la superficie que se encuentre dentro del límite. Esta herramienta también permite definir un límite con una línea de ruptura
	Diseño / Añadir línea	Añade una línea de ruptura entre dos puntos
	Diseño / Eliminar línea	Elimina una línea de ruptura o un límite Presione la flecha a la derecha del botón para seleccionar el tipo de línea a eliminar. Las opciones del menú desplegable son: Todos Línea de ruptura Límites de inclusión Límites de exclusión Lím.de inclusión y línea de ruptura Lím.de exclusión y línea de ruptura
	Diseño | Cambiar triángulos	Intercambia dos triángulos adyacentes siempre que formen un cuadrilátero convexo
	Diseño / Eliminar triángulo	Excluye un triángulo del modelo de superficie

La herramienta permanece activa hasta que se seleccione otra diferente.


Menús de acceso directo

Para ver un menú de acceso directo use el botón derecho del ratón mientras se encuentre en una ventana gráfica. Dicho menú es interactivo y presenta diferentes opciones dependiendo del contexto en el que se haga clic con el botón.

Las principales opciones disponibles son:

Ventana gráfica principal

El menú de acceso directo de la ventana gráfica principal es:


Teclas de acceso directo

Para elegir cualquier comando del menú al que acceder desde la barra de menús, puede bien utilizar el ratón o usar el teclado.

SUGERENCIA: En la mayoría de los métodos abreviados, presione Alt y a continuación la primera letra del nombre del menú seguida de la primera letra del comando. Para muchos de los menús también pueden utilizarse métodos abreviados conocidos de Microsoft Windows, como en el caso de Abrir, Guardar, Salir, y Deshacer.

MENU	METODO ABREVIADO DEL TECLADO
Archivo
Abrir	Ctrl + A
Guardar	Ctrl + G
Salir	Alt + S
Editar
Deshacer	Ctrl + Z
Ver
Alcance del zoom	Ctrl + E
Refrescar	F5
Ventana Propiedades	Alt + Enter
Diseño
Actualizar superficie	F4
Menú de acceso directo
Modo de selección	F2


Visualización de informes

El software DTMLink™ genera informes (tales como los de volumen y los de cruces de líneas de ruptura).

Por defecto los informes se almacenan en C:\Trimble Geomatics Office\Proyectos\xx\Informes\DTMLink\yy donde xx es el nombre del proyecto e yy es el nombre de la superficie.

Se podrá ver el informe más adelante abriéndolo en Microsoft Windows Explorer en dicha carpeta.


Rellenar campo

Utilice este campo desde cualquier ventana gráfica (incluyendo la ventana flotante) para introducir valores en los campos de los diálogos. Por ejemplo, para introducir valores en el diálogo Excluir punto, haga clic en un punto de la superficie.

En los campos en que puede utilizarse la opción Rellenar campo, el puntero de la ventana gráfica se muestra así:

NOTA: Si la entidad que se selecciona en la ventana gráfica no puede facilitar el valor deseado por el campo resaltado, el campo del diálogo quedará sin alterar.

Presione y mantenga presionado para obtener una vista preliminar, localizar, y comprobar valores antes de copiarlos. A medida que se arrastra el ratón los campos muestran los valores y la barra de estado presenta un resumen de las entidades. Los valores sólo se copiarán cuando se suelte el ratón.

Algunos campos se rellenan como un grupo de valores. Un único clic intenta rellenar todos los campos agrupados. Por ejemplo, los campos Norte y Este generalmente forman un grupo. Para rellenar un solo campo, selecciónelo, mantenga Alt presionada y haga clic.

Después del relleno el cursor se trasladará al siguiente campo.

SUGERENCIAS:

Si mantiene Ctrl presionado mientras utiliza Rellenar campo evitará el salto entre entidades y sólo se elegirán las coordenadas. De esta forma podrá elegir las coordenadas próximas a una entidad.

Puede utilizar los comandos del menú Ver (por ejemplo, Zoom y Pan) para localizar entidades con los valores requeridos para el relleno. Una vez localizados, deberá resaltar el campo antes de copiar el valor.


Barra de títulos

La barra de títulos se extiende a lo largo de la parte superior de la pantalla, sobre la barra de menús.


Barra de menús

La barra de menús se encuentra por debajo de la barra de títulos. Contiene los siguientes menús desplegables:

Archivo

Editar

Ver

Diseño

Herramientas

Ventana

Ayuda

Elección de un comando

Para elegir un comando desde un menú, haga clic en el mismo con el ratón.

Método abreviado con el teclado

Puede utilizar un ratón para elegir cualquier comando del menú al que se acceda desde la barra de menús. Sin embargo, también puede emplear el teclado.

Si prefiere utilizar el teclado, presione Alt y la letra subrayada que corresponda con el menú deseado. A continuación presione la letra subrayada que corresponda al comando deseado, o utilice las teclas de flecha hacia arriba o hacia abajo y presione Enter para efectuar la selección.

SUGERENCIA: Para la mayoría de los comandos comunes también puede utilizar métodos abreviados conocidos de Microsoft Windows como el caso de Abrir y Guardar.

 Véase también


Barra de estado

La barra de estado muestra gran variedad de mensajes y provee comentarios inmediatos y concisos sobre el estado actual del software DTMLink™.

La barra de estado se muestra en la parte inferior de la ventana gráfica principal del software DTMLink. Véase la Figura 1.

Figura 1  Barra de estado

Panel de mensajes

El panel de mensajes de la barra de estado muestra información sobre el funcionamiento del software DTMLink.

Este panel describe acciones de elementos del menú a medida que se resaltan. Por ejemplo, el mensaje “Abre una superficie” se muestra cuando se resalta el comando Archivo / Abrir superficie. El panel también muestra mensajes que describen las acciones de los botones de la barra de herramientas a medida que se resaltan. Por ejemplo, el mensaje “Cambia el centro del área del zoom” se muestra cuando el cursor se coloca sobre la herramienta Pan de la barra Ver.

Panel de coordenadas

Cuando el ratón está dentro de una ventana gráfica, se muestran las coordenadas correspondientes.

Panel del tamaño (alcance)

Este panel muestra la anchura y altura de la ventana gráfica sobre la que está el ratón.

Panel de indicadores

Este panel se resalta cuando se ha efectuado un cambio a la superficie y ésta necesita actualizarse. Una vez que se han agregado las líneas de ruptura o límites adicionales a la superficie aparece el indicador Actualizar superficie en dicho panel (tal y como se muestra en la figura anteriormente mostrada) y será necesario actualizar la superficie.

Esquina de la ventana

La esquina de la ventana le permite cambiar el tamaño de la ventana gráfica principal.


Sugerencias

Hay los siguientes temas disponibles:

Utilización de las barras de herramientas

Menús de acceso directo

Teclas de acceso directo

Visualización de informes

Rellenar campo

Barra de títulos

Barra de menús

Barra de estado

Barra de herramientas Estándar

Barra de herramientas Ver

Barra de herramientas Superficie


Informe del volumen
Herramientas / Informe del volumen

Utilice este comando para crear un informe del volumen de la superficie actual.

Tipo de informe

Desde esta casilla de verificación, elija el tipo de informe de volumen de la superficie actual.

Los tipos de cálculos de volumen disponibles son:

Sobre una elevación

Use esta opción para cálculos de reservas (“stockpile”).

NOTA: Se asume que la reserva está en una base horizontal.

Entre dos elevaciones

Use esta opción para calcular volúmenes de materiales en capas horizontales.

Volumen del hueco

Use esta opción para calcular el volumen de “aire” entre dos elevaciones específicas. Dicho de otra manera, el volumen del hueco es el volumen existente entre dos elevaciones de curvas de nivel específicas, que no se incluye bajo el modelo de superficie de curvas de nivel.

Elevación superior

La elevación superior define la elevación más alta para calcular el volumen. El valor por defecto mostrado en este campo es el punto más alto de la superficie de la curva de nivel. Este campo estará disponible cuando se requiera una elevación superior para el cálculo del volumen.

CONSEJO: Haga clic en Más alto para seleccionar el valor de elevación máxima del modelo de superfice de curvas de nivel.

Elevación base

Esta elevación define la elevación más baja con el que calcular el volumen. El valor por defecto de este campo es el punto más bajo de la superficie de curvas de nivel.

CONSEJO: Haga clic en Más bajo para seleccionar el valor de elevación mínimo del modelo de superfice de curvas de nivel.

Merma/Abultamiento

Esta opción determina si los volúmenes del informe se corrigen por compactación (merma) o expansión de los materiales (abultamiento). La opción conmuta entre Merma y Abultamiento.

NOTA: Para volúmenes brutos (volumen sin merma ni abultamiento) introduzca cero en el campo Porcentaje.

Porcentaje

Introduzca en este campo el factor real de abultamiento o merma (expresado como un porcentaje).

Por ejemplo, si la opción seleccionada es Merma y el valor del campo Porcentaje es del diez por cien (10%), el software DTMLink™ informa que el volumen es un diez por ciento más pequeño que el volumen bruto.

Es decir, con un volumen bruto de 600 metros cúbicos, la opción Merma seleccionada, y un factor de merma del diez por ciento, el software DTMLink indica que el volumen es de 540 metros cúbicos.


Sobre una elevación

Esta opción calcula el volumen sobre una elevación específica al punto más alto de la superficie de curvas de nivel. Se calculan los volúmenes de los prismas individuales triangulares definidos por los planos triangulares que forman el modelo digital del terreno (MDT).

El método calcula

  el volumen sobre un plano (elevación base específica)

  el área del plano

  el área de la superficie

La Figura 1 muestra el método del cálculo del volumen prismoidal.

Figura 1 Método del cálculo del volumen prismoidal

El volumen del prisma (Vp) se calcula a partir de la siguiente ecuación:

donde:

H1 es la elevación del primer punto

H2 es la elevación del segundo punto

H3 es la elevación del tercer punto

BE es la elevación del nivel base

P es el área del plano.

El área del plano es el área del triángulo de la superficie proyectada en un plano.

Dicho área (P) se calcula a partir de la siguiente ecuación:

donde:

es la longitud del triángulo base, calculado a partir de coordenadas de cuadrícula

es la altura del triángulo base, calculado a partir de coordenadas de cuadrícula

El volumen de cada prisma triangular se calcula individualmente y a continuación se suma para dar el volumen total dentro del área del límite del modelo. Cuando una elevación base específica corta el triángulo, se calcula el volumen del prisma de la parte del triángulo que está sobre la elevación base.

 Véase también


Ejemplo del cálculo del volumen sobre una elevación

Una aplicación común del método de cálculo de volumen sobre una elevación es la supervisión del relleno regular de vertederos (refuse pits) y zonas del estilo.

Paso 1. Defina un límite común para la zona de interés. Véase la Figura 1.

Figura 1  Aplicación de relleno de un lugar – Zona general

Paso 2. Recorte el modelo de curvas original que cubre toda la ubicación mediante un límite de inclusión. Los datos de las curvas de nivel deben llegar por lo menos hasta el límite de inclusión definido. Véase la Figura 2.

Figura 2  Parte del modelo de superficie original

Paso 3. Calcule el volumen entre la elevación base definida y la superficie de curvas original. Véase la Figura 3.

Figura 3  Volumen bajo la superficie original

Paso 4. Forme la segunda superficie de curvas utilizando los puntos que definen la zona rellenada. Recorte este nuevo modelo utilizando la definición de límite de inclusión original. Una vez más los datos de las curvas de nivel deberán llegar hasta este límite. Véase la Figura 4.

Figura 4  Nuevo modelo de curvas de nivel

Paso 5. Calcule el volumen entre la misma elevación base utilizada para la primera superficie y la nueva superficie. Véase la Figura 5.

Figura 5  Volumen bajo la nueva superficie

Paso 6. Calcule el volumen bajo la superficie original (véase 3 en la Figura 6) a partir del volumen bajo la nueva superficie.

Figura 6  El volumen calculado

 Véase también


Entre dos elevaciones

Esta opción le permite calcular el volumen entre las elevaciones superior e inferior. Se utiliza el mismo método de cálculos de volúmenes basado en el cálculo de los volúmenes de prismas triangulares.

La opción Entre dos elevaciones se utiliza para calcular el volumen del modelo de curvas de nivel seleccionado entre dos elevaciones de curvas específicas.

La Figura 1 muestra el volumen a calcular entre dos elevaciones.

Figura 1  Volumen entre dos elevaciones

Elevación superior

La Figura 1 muestra el volumen que hay sobre la elevación superior. Esta es la elevación sobre la que no se requiere ningún volumen. El valor por defecto de este campo es el punto más alto de la superficie de curvas de nivel.

Introduzca la elevación bajo la cual va a calcularse el volumen en el campo Elevación superior.

Elevación base

El diagrama arriba mostrado indica el volumen sobre la elevación inferior. La elevación base define la elevación bajo la cual no se requiere ningún volumen. El valor por defecto de este campo es el punto más bajo de la superficie de curvas de nivel.

Introduzca la elevación sobre la cual va a calcularse el volumen en el campo Elevación base.


Volumen del hueco

Esta opción se utiliza para calcular el volumen de “aire” entre dos elevaciones específicas. Dicho de otra manera, el volumen del hueco es el volumen existente entre dos elevaciones de curvas de nivel específicas, que no se incluye bajo el modelo de superficie de curvas de nivel.

Para utilizar la opción Volumen hueco, especifique una elevación base que esté por debajo de la parte inferior del modelo, y una elevación superior que defina la superficie horizontal que se quiere rellenar. Véase la Figura 8.

Figura 8  Cálculo del volumen hueco

El volumen sobre la elevación base es el volumen total sobre dicha elevación (que incluye el volumen sobre la elevación superior).

El volumen del hueco se calcula utilizando la fórmula siguiente:

Volumen del hueco = BA x (UE – BE) – (BV – UV)

donde:

BA es el área del plano sobre la elevación base

UE es la elevación superior

BE es la elevación base

BV es el volumen sobre la elevación base

UV es el volumen sobre la elevación superior

Elevación superior

La Figura 8 muestra cómo la elevación superior define la parte superior del volumen hueco. El valor por defecto en este campo es el punto más alto de la superficie de curvas de nivel.

Elevación base

La Figura 8 muestra cómo la elevación base está por debajo de la parte inferior del volumen hueco. El valor por defecto en este campo es el punto más bajo de la superficie de curvas de nivel.

 Véase también


Ejemplo de volumen de hueco

El método del volumen hueco se utiliza para calcular el volumen de agua a contener por una presa propuesta.

Los pasos involucrados en el cálculo de dicho volumen son:

Paso 1. Forme un modelo de curvas de nivel utilizando los datos que definen la superficie del terreno para la presa propuesta. Una vez hecho el modelo de curvas, defina un límite de inclusión que limite dicho modelo a la zona de la presa que va a contener agua. Este límite debe definirse a lo largo de la cara de la presa propuesta. De esta forma se asegura que el volumen calculado esté detrás de la presa.

Paso 2. Calcule el volumen del hueco, especificando el nivel de agua deseado como la Elevación superior.

La Figura 1 muestra un ejemplo de la zona sobre la cual podría hacerse el cálculo del volumen, junto con un ejemplo de corte transversal de la cresta de la presa que muestra el volumen del espacio vacío calculado.

Los resultados de dicho cálculo dan el volumen de agua entre la elevación base especificada (que debe elegirse de forma que esté por debajo del punto más profundo de la presa), y la elevación superior (la del agua). Este volumen hueco representa el volumen que va a rellenarse con agua y que está sobre la superficie pero por debajo del nivel de agua especificado, y por ello representa el volumen requerido. Véase la Figura 1.

Figura 1: Ejemplo

 Véase también


Reconstruir superficie
Herramientas / Reconstruir superficie

Utilice este comando para reconstruir la superficie a partir de los puntos de superficie originales. Volverán a incluirse todos los puntos o triángulos del modelo de curvas de nivel que se hayan eliminado. Este comando utiliza los límites y líneas de ruptura que se crearon tras la importación de los puntos de la superficie original.

CUIDADO: Una vez reconstruida una superficie, los triángulos elimados o intercambiados no se mantienen. En cambio los puntos excluidos sí.


Comparar superficies
Herramientas / Comparar superficies

La opción Comparar superficies le permite generar una comparación entre superficies de dos superficies seleccionadas. La superficie resultante o de comparación proveerá una superficie con curvas de nivel de la diferencia en las elevaciones entre las superficies mayor y base. Se puede usar la superficie de comparación para calcular el volumen entre las dos superficies.

 Véase también

Superficie mayor

Seleccione la superficie mayor en la lista desplegable. Utilice el campo En carpeta para seleccionar la carpeta adecuada según corresponda.

 Véase también

Superficie base

Seleccione la superficie base requerida en la lista desplegable. Use el campo En carpeta para seleccionar la carpeta adecuada según corresponda.

 Véase también

Nueva superficie

Introduzca el nombre de la superficie de comparación. El nombre debe ser único para el proyecto actual.

Método de comparación

Seleccione el método de comparación. Elija entre:

  Sencilla

  Detallada

 Véase también


Cálculo del volumen entre dos superficies

Al usar la opción Volumen del hueco es posible calcular los volúmenes del desmonte y terraplén entre dos superficies usando una superficie de comparación. La elevación base se configura en el punto más bajo en el modelo de curvas y la elevación superior se configura en cero. Las líneas de curvas de nivel cero indican dónde hay un cambio de un área de desmonte a terraplén. Esto significa que el volumen calculado sobre la Elevación superior es la suma de los volúmenes de todas las áreas de terraplén. La suma de los volúmenes de todas las áreas de desmonte vuelven al Volumen del huevo entre la Elevación base y la Elevación superior.

Si se necesita el volumen de un área particular de desmonte o terraplén, esto se puede lograr al definir un límite de inclusión alrededor del área para la que se necesita el volumen individual. Luego el modelo se vuelve a formar y la opción Volumen del hueco se utiliza sobre dicho modelo, con la Elevación base configurada nuevamente en el punto más bajo en el modelo y la Elevación superior configurada en cero. Si el área involucrada es un área de terraplén, el volumen de terraplén volverá como el volumen sobre la Elevación superior. Si el área involucrada es un área de desmonte, el volumen de desmonte calculado será el Volumen del hueco entre la Elevación superior y la Elevación base.

 Véase también


Superficie mayor y base

La selección de la superficie mayor y de la superficie base define la dirección de las diferencias de elevación.

Es decir, un área en la superficie mayor que sea más alta que el área correspondiente en la superficie base se mostrará como un área con elevación positiva.

Un área en la superficie mayor que sea más baja que la superficie base se mostrará como un área con elevación negativa. Las áreas que no son comunes a ambas superficies no aparecerán en la superficie de comparación.


Método de comparación

Seleccione el método de comparación.

Sencilla

Esta es una comparación de puntos en dos sentidos con respecto a la superficie. Todos los puntos en las superficies mayor y base se proyectan sobre la otra superficie y se calcula una diferencia de elevación. Dicha diferencia de elevación y posición de coordenadas forman las coordenadas modelo para la superficie de comparación. Cuando tiene las curvas de nivel, la superficie de comparación representará la relación desmonte-terraplén entre las superficies comparadas. Consulte la Figura 1.

Figura 1 : Comparación de superficies sencilla

Detallada

La comparación detallada inicialmente realiza el mismo proceso que para la comparación sencilla. Además, la comparación detallada formará una coordenada de comparación en cada intersección de un lado del triángulo de una superficie, con un lado de un triángulo de otra superficie, en el plano horizontal. Al usar dicho método se puede tomar la mayor cantidad de información de los dos modelos. La superficie de comparación resultante es más detallada puesto que utiliza formaciones triangulares (y por lo tanto usando información de líneas de ruptura) de las dos superficies. El método detallado demorará más que el método sencillo. Consulte la Figura 2.

Figura 2 : Comparación de superficies detallada

NOTA: En el procesamiento de la superficie de comparación, se ignorarán todas las líneas de ruptura y límites en las superficies mayor y base. Si se necesitan límites, se tendrán que añadir después de la operación de Comparación y entonces la superficie de comparación se tendrá que actualizar. No es posible definir líneas de ruptura en una superficie de comparación. Al emplear Añadir línea, podrá incluir líneas de ruptura en una actualización de la superficie de comparación, pero el resultado será incorrecto y no tendrá sentido. Esto se debe a que la superficie de comparación se modela sobre puntos de la superficie, cuyas elevaciones consisten en diferencias entre puntos de la base de datos y líneas de ruptura sólo se pueden definir con puntos de la base de datos.


Menú Herramientas

Use el menú Herramientas para hacer cálculos y trabajar con los datos. Tiene los siguientes comandos:

Informe del volumen

Reconstruir superficie

Comparar superficies


Acercar
Ver / Acercar

	Haga clic en la herramienta Acercar de la barra de herramientas Ver

Use esta herramienta para examinar de cerca una parte de la ventana gráfica.

Con la herramienta Acercar seleccionada:

1.	Mueva el puntero sobre la ventana gráfica. Se mostrará un puntero con forma de lupa y un signo más (+). Encima de dicho puntero aparecen unas cruces que indican el punto interactivo.

2.	Haga uno de los siguientes pasos:

  Haga clic en una posición de la ventana gráfica para acercar con un factor de dos, centrado en el punto interactivo.

  Haga clic y arrastre el puntero por la ventana gráfica para crear un rectángulo que contenga la zona sobre la que quiere hacer zoom para acercar. Cuando menor sea la zona, mayor será el cambio de escala. En cuanto se suelte el ratón, el contenido de la zona encerrada en el rectángulo ocupará toda la ventana.

NOTAS:

Presione Esc mientras pulsa el botón izquierdo del ratón para cancelar la operación actual de la herramienta Acercar.

Mantenga presionado Shift mientras utiliza la operación del zoom para abrir una ventana flotante de la zona en que se ha hecho zoom.


Alejar
Ver / Alejar

Método abreviado

	Haga clic en la herramienta Alejar de la barra de herramientas Ver

Use esta herramienta para ver una zona mayor de la ventana gráfica.

Con la herramienta Alejar seleccionada:

1.	Mueva el puntero sobre la ventana gráfica. Se mostrará un puntero con forma de lupa y un signo menos (-). Encima de dicho puntero aparecen unas cruces que indican el punto interactivo.

2.	Haga uno de los siguientes pasos:

  Haga clic en una posición de la ventana gráfica. La escala de dicha ventana cambiará con un factor de dos y se centrará en la posición del punto interactivo.

  Haga clic y arrastre el puntero por la ventana gráfica para crear un rectángulo que contenga la zona sobre la que quiere hacer zoom y suelte el botón. La escala de la ventana gráfica cambiará, y se mostrará la zona que estaba contenida en el rectángulo. Para cancelar Alejar, vuelva a poner el puntero en el punto donde comenzó a arrastrar antes de soltar el botón del ratón.

NOTAS:

Presione Esc mientras pulsa el botón izquierdo del ratón para cancelar la operación actual de la herramienta Alejar.

Haga clic y arrastre un rectángulo sobre la ventana gráfica. Cuando la operación de Alejar se realiza, la vista anterior está dentro del rectángulo. Cuanto menor sea el rectángulo, mayor será el cambio de escala.


Pan
Ver / Pan

	Haga clic en la herramienta Pan de la barra de herramientas Ver.

Use esta herramienta para cambiar el contenido de la ventana gráfica y mostrar una zona diferente de la vista de la pantalla. La herramienta Pan mueve el origen de la vista.

Una vez seleccionada la herramienta Pan:

1.	Mueva el puntero sobre la ventana gráfica. Aparecerá un puntero con forma de mano. La cruz que hay sobre éste indica el punto interactivo.

2.	Haga uno de los siguientes pasos:

Haga clic en una posición de la ventana gráfica. Dicha posición se convierte en el nuevo centro de la ventana.

  Haga clic y arrastre el puntero con forma de mano en la dirección y a la distancia que quiera panoramizar. Se mostrará una línea que indica la dirección y distancia en que se va a mover la pantalla. Suelte el botón. La vista de la pantalla se moverá a esta nueva posición. Para cancelar Pan, vuelva a colocar el puntero en el punto desde donde empezó a arrastrar antes de soltar el botón del ratón.

NOTA: Presione Esc mientras pulsa el botón izquierdo del ratón para cancelar la operación actual de la herramienta Pan.


Pan hasta
Ver / Pan hasta

Utilice este comando para hacer pan y poner a escala una ubicación en particular de la ventana gráfica.

Se abrirá el diálogo Pan hasta.

Centro de la vista

Este grupo de campos le permite el relleno de campos, como en el caso de especificar un nombre o ubicación para el centro de la vista.

Nombre pto	Use este campo para introducir el nombre del punto del centro de la vista. Los campos Norte y Este se actualizarán automáticamente.
Este/Norte	Use estos campos para introducir el centro de la vista, si no conoce el nombre del punto.
Radio para vista

El campo Radio para vista configura la ubicación de la vista actual.

El centro de la pantalla se mueve la distancia del radio que especifique en función de la orientación de la ventana gráfica tal como se muestra en la Figura 1:

Figura 1: Orientación de la pantalla


Alcance del zoom
Ver / Alcance del zoom

	Haga clic en la herramienta Alcance del zoom de la barra de herramientas Ver

Utilice este comando para ver todos los puntos visibles de la superficie actual.

Cuando seleccione el comando Alcance del zoom, la ventana gráfica se ajustará automáticamente de forma que se vean todos los datos.


Zoom anterior
Ver / Zoom anterior

	Haga clic en la herramienta Zoom anterior de la barra de herramientas Ver.

Utilice este comando para retroceder y poder ver todas las vistas anteriores.


Ventana flotante
Ver / Ventana flotante

	Haga clic en la herramienta Ventana flotante de la barra de herramientas Ver.

Utilice este comando para mostrar la ventana flotante. Cuando está abierta, la ventana flotante queda en la parte superior.

La ventana flotante provee otra vista. Como en el caso de las otras ventanas gráficas, puede utilizarse Rellenar campo, Selección, y Zoom desde dentro de la ventana flotante.

Esto significa que, por ejemplo, puede utilizar la ventana flotante como una herramienta que provea una vista a vuelo de pájaro de la ventana gráfica. Ambas ventanas pueden emplearse para las operaciones habituales (tales como Rellenar campo, Selección, y Zoom).

NOTA: Ver / Alcance del zoom funciona en la ventana gráfica. Si quiere realizar este tipo de zoom en la ventana flotante haga clic en el Menú Acceso directo.

Para obtener una vista ampliada de la ventana flotante, seleccione la herramienta Acercar, especifique en la ventana gráfica la zona a ampliar manteniendo presionada la tecla Shift y arrastrando con la herramienta Acercar.

Para obtener una vista ampliada en la ventana gráfica, seleccione la herramienta Acercar y especifique en la ventana flotante la zona a ver manteniendo presionada la tecla Shift y seleccionando el punto de la ventana gráfica desde el que hacer zoom. Así se demuestra la forma en que la ventana flotante puede utilizarse como vista a vuelo de pájaro.

NOTA: La barra de herramientas de la ventana flotante se muestra activa cuando la ventana gráfica asociada también está activa.


Barras de herramientas
Ver / Barras de herramientas

Utilice este comando para mostrar u ocultar barras de herramientas.

Cada una de estas barras es una serie de herramientas representadas por un botón. Cada herramienta está disponible como un comando del menú.

Barras de herramientas

Seleccione la casilla de verificación para mostrar u ocultar las barras de herramientas. Si se muestra una marca de verificación se indica que la barra en cuestión está visible.

Cerrar

Haga clic en Cerrar para salir del diálogo.

Todas

Haga clic en Todas para mostrar todas las barras de herramientas.

Ninguna

Haga clic en Ninguna para ocultar todas las barras de herramientas.

Restaurar

Haga clic en Restaurar para restaurar las barras de herramientas al valor por defecto.

 Véase también


Capas
Ver / Capas

	Use la herramienta Visibilidad capa de la barra de herramientas Ver.

Utilice este comando para mostrar u ocultar las capas de la vista actual.

Cuando se muestre u oculte una capa en particular, el software DTMLink™ muestra u oculta las entidades que lo componen.

NOTA: El mostrar u ocultar una capa en software DTMLink es similar a habilitar o inhabilitar capas en AutoCAD. Si se inhabilita una capa de cambio de pendiente (línea de ruptura) ésta no queda inhabilitada para emplearse en una superficie. No afecta el modelo de la superficie, sólo la vista.

Capas

La lista de capas muestra los nombres de todas las capas de la superficie. Una marca de verificación indica que la capa es visible. Seleccione la casilla de verificación de una capa en particular para habilitarla o inhabilitarla.

Todas

Haga clic en Todas para mostrar todas las capas de la lista.

Ninguna

Haga clic en Ninguna para ocultar todas las capas de la lista.

ADVERTENCIA: Cuando se inhabilite la visibilidad de todas las capas no se mostrará ninguna entidad en pantalla.

NOTA: Cuando se inhabilita una capa se resalta el indicador Capas del panel de indicadores.


Refrescar
Ver / Refrescar

Utilice este comando para refrescar la pantalla.

Seleccione este comando (o presione F5) para volver a dibujar la vista en planta cuando la ventana gráfica se sobrescriba y resulte difícil de leer.


Opciones
Ver / Opciones

Utilice este comando para ajustar las curvas de nivel y los triángulos que aparecen en la ventana gráfica.

Se puede:

 mostrar u ocultar la presentación de curvas de nivel y triángulos

 cambiar los intervalos mayor y menor de las curvas de nivel

 editar los colores de las curvas de nivel y los triángulos

 editar los tipos de línea de las curvas de nivel y los triángulos

 editar el método de trazado de curvas de nivel

Las fichas del diálogo Opciones muestran las configuraciones (o especificaciones) que pueden cambiarse en el software DTMLink™.

Las fichas son:

Opciones de línea

Avanzado


Opciones de línea

Use la ficha Opciones de línea del diálogo Opciones para especificar la manera en que mostrar los triángulos y curvas de nivel en la ventana gráfica.

Mostrar curvas

Use este grupo para configurar las opciones de línea para las curvas de nivel. Habilite la casilla de verificación Mostrar curvas para mostrarlas en la ventana gráfica. Inhabilítela para ocultar las curvas.

Intervalo	Configure el intervalo mayor y menor para las curvas de nivel.

ADVERTENCIA: Use colores diferentes para la presentación de los intervalos mayor y menor. Así podrá visualizar rápidamente los cambios de elevación.

Las unidades especificadas en este campo son las configuradas en el software Trimble Geomatics Office™.

No puede configurar un intervalo menor a un valor mayor que el del intervalo mayor. El intervalo mayor debe ser un múltiplo del menor.

Color pos	Especifique el color de presentación de las curvas que están sobre cero. Seleccione un color de la lista.

Use colores diferentes para la presentación de los intervalos mayor y menor. Así podrá visualizar rápidamente los cambios de elevación.

Color neg	Especifique el color de presentación de las curvas que están por debajo de cero. Seleccione un color de la lista.

Use colores diferentes para la presentación de los intervalos mayor y menor. Así podrá visualizar rápidamente los cambios de elevación.

Tipo de línea 	Elija un tipo de línea de la lista.

Mostrar triángulos

Use este grupo para especificar las opciones de línea de los triángulos. Seleccione la casilla de verificación para mostrar los triángulos de la ventana gráfica. Inhabilite la casilla para ocultarlos.

Color	Este campo especifica el color para la presentación de triángulos. Seleccione un color de la lista. Este color muestra los bordes de los triángulos.

Tipo de línea	Elija un tipo de línea de la lista.

Aplicar

Haga clic en Aplicar para aplicar los cambios y mantener abierto el diálogo Opciones.

Aceptar

Haga clic en Aceptar para aplicar los cambios y salir del diálogo.


Opciones avanzadas

Use la ficha Avanzado del diálogo Opciones para definir el rango de curvas de nivel y su presentación en la ventana gráfica.

Dibujar curvas como líneas

Seleccione la opción Dibujar curvas como líneas para mostrar líneas rectas entre los triángulos del modelo.

Dibujar curvas como curvas

Seleccione la opción Dibujar curvas como curvas para mostrar una curva más real entre los triángulos del modelo.

Use la barra Tensión de curva para especificar la rectitud de la curva. Es decir, si se configura a un valor máximo se generará una línea recta. La posición por defecto del control deslizante generalmente crea curvas agradables a la vista.

ADVERTENCIA: Use el control deslizante en situaciones poco usuales en las que una curva de nivel se cruza con otra debido a la suavización de curvas.

Mostrar todas las curvas

Seleccione esta opción para mostrar todas las curvas del modelo.

Mostrar curvas entre

Seleccione esta opción para mostrar todas las curvas que estén dentro del rango de elevación especificado.

Elevación mínima	Introduzca en este campo la elevación mínima de las curvas de nivel a mostrar. El valor que aparece por defecto es el del punto más bajo registrado en el modelo.

ADVERTENCIA: Haga clic en Más alto para seleccionar el valor de elevación máximo.

Elevación máxima	Introduzca en este campo la elevación máxima de las curvas de nivel a mostrar. El valor que aparece por defecto es el del punto más alto registrado en el modelo.

ADVERTENCIA: Haga clic en Más bajo para seleccionar el valor de elevación mínimo.

Aplicar

Haga clic en Aplicar para aplicar los cambios y mantener abierto el diálogo Opciones.

Aceptar

Haga clic en Aceptar para aplicar los cambios y salir del diálogo.


Propiedades
Ver / Propiedades

	Haga clic en la herramienta Propiedades de la barra de herramientas Estándar.

Use la ventana Propiedades para ver las propiedades de cada elemento.

NOTA: No se pueden editar entidades en la ventana Propiedades. Para editar elementos, vuelva al software Trimble Geomatics Office™ y use la ventana Propiedades para editar las entidades. Cree una nueva superficie utilizando las entidades editadas.

La ventana Propiedades muestra el nombre y los valores correspondientes de la entidad seleccionada.

ADVERTENCIA: Para cambiar el tamaño de la ventana Propiedades, haga clic y arrastre el borde de la ventana. Para cambiar el tamaño de la división del interior de la ventana haga clic y arrastre la barra de división.


Ventana Propiedades

La ventana Propiedades le permite ver las propiedades de cada elemento, pero no puede editarlas. La misma muestra los nombres y valores apropiados del elemento.

NOTA: Sólo puede seleccionarse un elemento por vez.


Menú Ver

El menú Ver provee comandos para el control y mantenimiento de la presentación de la superficie de curvas de nivel de la ventana gráfica. Hay los siguientes comandos disponibles:

Acercar

Alejar

Pan

Pan hasta

Alcance del zoom

Zoom anterior

Ventana flotante

Barras de herramientas

Capas

Refrescar

Opciones

Propiedades


Nueva ventana
Ventana / Nueva ventana

Utilice este comando para abrir otra ventana de la superficie actual.

Utilícelo para abrir una ventana nueva que tenga el mismo contenido que la ventana activa. Pueden abrirse ventanas múltiples para mostrar vistas o partes diferentes a la vez. Si se cambia el contenido en una ventana, todas las otras reflejarán dichas modificaciones. Cuando se abra una nueva ventana, ésta se convertirá en la activa y se mostrará por encima de las anteriormente abiertas.


Cascada
Ventana / Cascada

Utilice este comando para cambiar el tamaño de las ventanas y diálogos activos del escritorio y para ordenarlos siguiendo un patrón de superposición desde la parte superior izquierda a la inferior derecha.

Cuando ponga las ventanas en cascada, se mostrarán en capas y podrán verse los títulos de todas las ventanas del escritorio.


Mosaico
Ventana / Mosaico

Utilice este comando para mover y cambiar el tamaño de las ventanas y diálogos abiertos en el escritorio y ordenarlos en forma de mosaico.


Organizar iconos
Ventana / Organizar iconos

Utilice este comando para ordenar los iconos de las ventanas minimizadas y mostrarlos de una manera organizada en la pantalla. Este comando coloca los iconos en la parte inferior de la ventana.


Lista de ventanas
Ventana / Lista de ventanas

Utilice la sección inferior de este menú para mostrar una lista de las ventanas actualmente abiertas en el escritorio. La ventana activa se indica con una marca de verificación.

Haga clic en el nombre de una ventana o diálogo en particular para activarlo/a.


Menú Ventana

Este menú contiene comandos para ver opciones. Estos comandos son:

Nueva ventana

Cascada

Mosaico

Organizar iconos

Lista de ventanas en pantalla


Cruce de límites

Cuando se detecta un cruce de límites, aparece el siguiente mensaje:

Se ha detectado un cruce de límites. ¿Desea ver el informe?

Haga clic en Sí para ver el informe.

Dicho informe muestra las dos líneas que se cruzan. Estas líneas se describen utilizando un nombre de punto, las coordenadas Norte y Este del inicio de la línea, y las coordenadas Norte y Este del final de línea.

A continuación se muestra un ejemplo de un informe de cruce entre límites.

Informe de cruce de límites

Proyecto tutorial DTMLink

Nombre proyecto	Tuturial DTMLink
Superficie	Superficie1
Unidades	Metros
Fecha de impresión	29/07/99 11:56am
Se ha detectado un cruce de límites

                 Punto       Norte         Este       Elevación

Línea de          187       4408.302      2482.427      119.708

        a         179       4430.895      2442.447      119.694   Se cruza con la

Línea de          181       4443.678      2465.296      119.772

       a          187       4408.302      2482.427      119.708

El informe se almacena en la carpeta de informes C:\Trimble Geomatics Office\Proyectos\xx\Informes\DTMLink\yy donde xx es el nombre del proyecto e yy es el nombre de la superficie.

Puede ver el informe más adelante abriéndolo en Microsoft Windows Explorer en dicha carpeta.


Cruce de líneas de ruptura

Cuando se detecta un cruce de líneas de ruptura, aparece el siguiente mensaje:

Se ha detectado un cruce de líneas de ruptura. ¿Desea ver el informe?

Haga clic en Sí para ver el informe.

Dicho informe muestra las dos líneas que se cruzan. Estas líneas se describen utilizando un nombre de punto, las coordenadas Norte y Este del inicio de la línea, y las coordenadas Norte y Este del final de línea.

A continuación se muestra un ejemplo de un informe de cruce de este tipo de líneas.

Informe de cruce de líneas de ruptura

Proyecto tutorial DTMLink

Nombre proyecto	Tutorial DTMLink
Superficie	Superficie1
Unidades	Metros
Fecha de impresión	28/07/99 3:23pm
Se ha detectado un cruce de líneas de ruptura

             Punto        Norte        Este       Elevación

Línea de      38       4456.360     2461.687      110.358

       a     187       4408.302     2482.427      119.708        Se cruza con la

Línea de     182       4447.684     2476.296      120.100

       a     181       4443.678     2465.296      119.722

Línea de      190       4411.104     2461.389      118.697

       a      183       4442.452     2486.146      120.193       Se cruza con la

Línea de       38       4456.360     2461.687      110.358

       a      187      4408.302      2482.427      119.708

El informe se almacena en la carpeta de informes C:\Trimble Geomatics Office\Proyectos\xx\Informes\DTMLink\yy donde xx es el nombre del proyecto e yy es el nombre de la superficie.

Se puede ver el informe más adelante abriéndolo en Microsoft Windows Explorer en dicha carpeta.


Coordenadas ajustadas

Si una línea de ruptura pasa muy cerca de un punto de la superficie, la altura de dicho punto se cambia a un valor interpolado a partir de la primera. Esto se produce para evitar que el punto cercano fuerce las curvas de nivel a la línea de ruptura.

Si no quiere que se ajuste este punto puede cambiar los valores Norte y Este de forma que el punto quede ligeramente fuera de la línea de ruptura.

Una vez que el sistema DTMLink ajusta las coordenadas, aparecerá el siguiente mensaje:

Coordenadas del punto ajustadas, ¿desea ver el informe?

Haga clic en Sí para ver el informe.

Este informe muestra información sobre el ajuste de las coordenadas del punto y detalles revisados de las coordenadas.

En el ejemplo siguiente se muestra un informe de coordenadas ajustadas:

Informe coordenadas ajustadas

Proyecto tutorial DTMLink

Nombre proyecto	Tutorial DTMLink
Superficie	Superficie1
Unidades	Metros
Fecha de impresión	28/07/99 2:37pm
Coordenadas ajustadas

Coordenadas del punto ajustadas - elevación configurada a la elevación interpolada de la línea de ruptura

                            Punto       Norte          Este       Elevación

Info de coords:                2453        4573.147        5734.531          23.000

Info de coords revisada:      2453        4573.147        5734.531          53.798

El informe se almacena en la carpeta de informes C:\Trimble Geomatics Office\Proyectos\xx\Informes\DTMLink\yy donde xx es el nombre del proyecto e yy es el nombre de la superficie.

Se puede ver el informe más adelante abriéndolo en Microsoft Windows Explorer en dicha carpeta.


Punto duplicado

Durante la creación de la superficie de curvas de nivel se comprueban todos los puntos para ver si tienen o no coordenadas Norte y Este duplicadas. Si se encuentran puntos duplicados el software DTMLink™ retiene el punto más reciente y descarta el(los) otro(s) punto(s).

A continuación se muestra un ejemplo de dicho informe:

Informe de puntos duplicados

Proyecto tutorial DTMLink

Nombre proyecto	DTMLink Tutorial
Superficie	Superficie1
Unidades	Metros
Fecha de impresión	28/07/99 4:02pm
Se han leído puntos duplicados

                          Punto       Norte        Este      Elevación

Punto retenido:               55138       4452.923       2487.237         55.912

Punto descartado:               138       4452.923       2487.237        116.912

Punto retenido:                1877       4408.302       2482.427         19.708

Punto descartado:               187       4408.302       2482.427        119.708

El informe se almacena en la carpeta de informes C:\Trimble Geomatics Office\Proyectos\xx\Informes\DTMLink\yy donde xx es el nombre del proyecto e yy es el nombre de la superficie.

Se puede ver el informe más adelante abriéndolo en Microsoft Windows Explorer en dicha carpeta.

NOTA: El software DTMLink no soporta caras verticales.


Tolerancia de curva

Las curvas y los arcos pueden definir límites y líneas de ruptura.

Para permitir la realización de cálculos triangulares con líneas de ruptura y límites que sean curvas o arcos, se representa la curva o el arco como una serie de segmentos lineales pequeños.

La Tolerancia de curva controla la longitud del segmento lineal. Una Tolerancia de curva es la distancia máxima permitida desde cualquier punto a lo largo de las series de segmentos lineales a la curva o arco, perpendicular al segmento lineal..

La Tolerancia de curva se configura a 0.02m.


Mensajes de error

Coordenadas ajustadas

Cruce de líneas de ruptura

Cruce de límites

Punto duplicado

Nombre pto no válido

La coordenada no se corresponde con un punto


Nombre pto no válido

Si se introduce un nombre de punto no válido en un diálogo se mostrará el siguiente mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Se debe introducir un nombre de punto que se haya definido como parte del modelo de superficie de curvas de nivel. Si se necesita un punto no definido originalmente:

1.	Vuelva a la pantalla Trimble Geomatics Office.

2.	Seleccione el comando del menú Herramientas / DTMLink / Superficie existente.

Aparecerá el diálogo Superficie existente.

3.	Añada los puntos nuevos a la superficie.

Consulte más información en la Ayuda en pantalla dentro del software Trimble Geomatics Office™.


La coordenada no se corresponde con un punto

Si se introducen en un diálogo coordenadas que no corresponden a las de un punto de la superficie actual se mostrará un mensaje de error:

La coordenada no se corresponde con un punto.

En el campo Norte y Este se deben introducir las coordenadas de un punto existente.

Si necesita las coordenadas que ha introducido:

1.	Vuelva a la pantalla Trimble Geomatics Office.

2.	Añada el nuevo punto con las coordenadas necesarias si éstas no existen.

3.	Seleccione el comando del menú Herramientas / DTMLink / Superficie existente.

     	Aparecerá el diálogo Superficie existente.

4.	Añada los puntos nuevos a la superficie.

Consulte la Ayuda en pantalla dentro del software Trimble Geomatics Office™ para obtener información adicional sobre el diálogo Superficie existente.


Inclusión de puntos

Utilice la herramienta Incluir punto [image] de la barra de herramientas Superficie o el comando Diseño /Incluir punto para incluir un punto en el modelo de superficie de curvas de nivel.

Diseño / Incluir punto

Use este comando para abrir el diálogo Incluir punto. Este sólo está disponible desde el comando del menú.

Cuando el diálogo Incluir punto está activo el cursor cambia a [image].

Use los campos del diálogo Incluir punto para seleccionar el punto de la superficie.

Punto a incluir

Utilice este grupo para introducir el nombre de las coordenadas Norte y Este del punto a incluir en la superficie.

Nombre pto

Utilice este campo para identificar el punto a incluir. Si éste es un valor de nombre de superficie válido los campos Norte y Este se rellenarán automáticamente.

NOTA: Si se introduce un valor de nombre de punto de superficie no válido se mostrará un mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Norte / Este

Utilice estos campos para introducir las coordenadas del punto de la superficie si no se conoce el nombre del punto.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este del punto en el grupo Punto a incluir.

NOTA: Si las coordenadas que se introducen no coinciden con las de un punto de superficie válido se mostrará un mensaje de error:

La coordenada no se corresponde con un punto

Aplicar

Si desea introducir otro punto a incluir haga clic en Aplicar para así actualizar la superficie y restaurar el diálogo.

Si sólo se quiere incluir un punto haga clic en Aceptar para actualizar la superficie automáticamente y cerrar el diálogo.

Herramienta Incluir punto

Haga clic en la herramienta Incluir punto [image] en la barra de herramientas Superficie para incluir un punto que no forme parte de la superficie.

El cursor cambiará a [image] cuando la herramienta Incluir punto esté activa.

En la ventana gráfica seleccione el punto a incluir.

Al incluirse el punto, la superficie se actualiza automáticamente.

ADVERTENCIA: El triángulo volverá a formarse si el triángulo que está entre el punto que acaba de incluir fue eliminado con anterioridad.

SUGERENCIA: Utilice Editar / Deshacer para revertir la acción de Incluir punto.


Exclusión de puntos

Utilice la herramienta Excluir punto [image] de la barra de herramientas Superficie o el comando Diseño / Excluir punto para excluir un punto del modelo de superficie de curvas de nivel.

Diseño / Excluir punto

Utilice este comando para abrir el diálogo Excluir punto. A este diálogo sólo puede accederse desde el comando del menú.

Cuando el diálogo Excluir punto esté habilitado el cursor cambiará a [image].

Use los campos del diálogo anterior para seleccionar el punto a excluir de la superficie.

Punto a excluir

Use el grupo Punto a excluir para introducir el nombre del punto o las coordenadas Norte y Este del punto a excluir de la superficie.

Nombre pto

Use este campo para identificar el punto a excluir. Si éste es un nombre de punto válido los campos Norte y Este se rellenarán automáticamente.

NOTA: Si se introduce un nombre de punto de superficie no válido, se mostrará un mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Norte / Este

Utilice estos campos para introducir las coordenadas del punto de la superficie si no conoce el nombre del punto.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este del punto en el grupo Punto a excluir.

NOTA: Si las coordenadas que se introducen no coinciden con las de un punto de superficie válido se mostrará un mensaje de error:

La coordenada no se corresponde con un punto

Aplicar

Si desea introducir otro punto a excluir haga clic en Aplicar para actualizar la superficie y restaurar el diálogo.

Si sólo se quiere excluir un punto haga clic en Aceptar para actualizar la superficie automáticamente y cerrar el diálogo.

Herramienta Excluir punto

Haga clic en la herramienta Excluir punto [image] de la barra de herramientas Superficie para evitar que se utilice un punto en el modelo de la superficie.

Cuando el comando Excluir punto esté habilitado el cursor cambiará a [image].

Seleccione el punto a excluir de la ventana gráfica.

Con esta opción, no tendrá que actualizar la superficie. Con la exclusión del punto se actualizará la superficie automáticamente.

NOTA: Se mostrará un mensaje de error si se selecciona un punto que no forme parte de la superficie.

SUGERENCIA: Utilice Editar / Deshacer para revertir la exclusión del punto.

Por ejemplo la exclusión del punto puede resultar útil en el caso de un punto que produzca curvas de nivel irregulares por ser impreciso. Con el comando Excluir punto dicho punto puede ignorarse.


Cambio de triángulos

Utilice la herramienta Cambiar triángulos [image] de la barra de herramientas Superficie o el comando Diseño / Cambiar triángulos para cambiar dos triángulos del modelo de la superficie de nivel.

Diseño / Cambiar triángulos

Utilice este comando para abrir el diálogo Cambiar triángulos. A éste sólo se tiene acceso desde el comando del menú.

Cuando el diálogo anterior esté habilitado el cursor cambiará a [image].

Utilice los campos del diálogo Cambiar triángulos para seleccionar los triángulos a cambiar en la superficie.

Primer triángulo

Utilice este grupo para identificar el primer triángulo a cambiar.

Norte / Este

Introduzca las coordenadas del triángulo para identificar el primer triángulo a cambiar.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este.

Segundo triángulo

Utilice este grupo para identificar el segundo triángulo a cambiar.

Norte / Este

Introduzca las coordenadas del triángulo para identificar el segundo triángulo a cambiar.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este.

Aplicar

Haga clic en Aplicar para cambiar los triángulos que forman cuadriláteros.

Haga clic en Aceptar para cambiar los triángulos y cerrar el diálogo.

SUGERENCIA: Use Editar / Deshacer para revertir la operación anterior.

Herramienta Cambiar triángulos

Haga clic en la herramienta Cambiar triángulos [image] de la barra de herramientas Superficie para modificar el modelo de superficie al cambiar sus triángulos.

Cuando Cambiar triángulos esté habilitado el cursor cambiará a [image].

Seleccione el primer triángulo a cambiar. Este se verá de color verde.

Seleccione el segundo triángulo. Si los dos triángulos seleccionados forman un cuadrilátero se intercambiarán las esquinas de las que parten las diagonales y se formarán dos nuevos triángulos. Véase la Figura 1 que se muestra más adelante.

Cambio de triángulos

Dos triángulos en contacto forman un cuadrilátero.

Véase la Figura 1.

 Figura 1  Triángulos

La herramienta Cambiar triángulos o el comando Diseño / Cambiar triángulos sólo funciona con cuadriláteros convexos. Si se selecciona uno cóncavo se mostrará un mensaje de error.

Cuando se intercambian los triángulos, se forma el gradiente de la altura entre puntos a lo largo de los lados de los nuevos triángulos. La línea de la curva de nivel que se crea puede ser ligeramente diferente, y ello puede resultar en una representación más real.

A veces el intercambio de triángulos no mejora la superficie de la curva. Esto sucede por ejemplo cuando dicha superficie es irregular.


Eliminación de triángulos

Use la herramienta Eliminar triángulo [image] de la barra de herramientas Superficie o el comando Diseño / Eliminar triángulo  para eliminar un triángulo del modelo de superficie de curvas de nivel.

Diseño / Eliminar triángulo

Utilice este comando para abrir el diálogo Eliminar triángulo. Este sólo está disponible desde el comando del menú.

Cuando dicho diálogo está habilitado, el cursor cambia a [image].

Utilice los campos del diálogo Eliminar triángulo para seleccionar los triángulos a eliminar de la superficie.

Triángulo a eliminar

Use el grupo Triángulo a eliminar para identificar el triángulo a eliminar.

Norte / Este

Introduzca las coordenadas del triángulo para identificar el triángulo a eliminar.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este.

Aplicar

Si se quiere introducir otro triángulo a excluir haga clic en Aplicar para así actualizar la superficie y restaurar el diálogo.

Si sólo se quiere excluir un triángulo haga clic en Aceptar para actualizar automáticamente la superficie y cerrar el diálogo.

SUGERENCIA: Use Editar / Deshacer para restaurar los triángulos eliminados.

Herramienta Eliminar triángulo

Haga clic en la herramienta Eliminar triángulo [image] de la barra de herramientas Superficie para cambiar el modelo de superficie mediante la eliminación de triángulos.

Cuando el comando anterior está habilitado el cursor cambia a [image].

Seleccione el triángulo a eliminar de la pantalla gráfica.

Triángulos que se han quitado

Cualquier triángulo que se quite no se incluye en el modelo digital del terreno (MDT). Esto resulta útil si se quiere un método rápido y eficiente para arreglar el borde externo del modelo de superficie  donde las curvas de nivel se forman con triángulos de formas alargadas y poco reales.

ADVERTENCIA: Los triángulos eliminados no vuelven a formarse en una actualización de superficie a no ser que se añada o edite un límite del modelo.

SUGERENCIA: Si el modelo vuelve a formarse tras la eliminación de triángulos, y las líneas de los límites se han editado, los triángulos eliminados volverán a formarse como parte del modelo. Si quiere mantener los triángulos eliminados tras la actualización de un modelo, ubique límites alrededor de los puntos respectivos antes de llevar a cabo la actualización.


Adición de líneas

Use las herramientas de Añadir línea de la barra de herramientas Superficie o el comando Diseño / Añadir línea para agregar una línea de ruptura o un límite al modelo de superficie de curvas de nivel.

Diseño / Añadir línea

Utilice este comando para abrir el diálogo Añadir línea. Este sólo está disponible desde el comando del menú.

Use los campos del diálogo Añadir línea para agregar una línea de ruptura o límite a la superficie de curvas de nivel.

Tipo de línea

Use el grupo Tipo de línea para especificar el tipo de línea que quiere.

La tabla tiene las siguientes opciones:

Para añadir…	Seleccione…
una línea de ruptura	la casilla de verificación Línea de ruptura
un límite	la casilla de verificación Límite. Puede especificar el tipo de límite eligiendo las opciones Incluir o Excluir.
Un tipo de línea de ruptura y un tipo de límite	ambas casillas de verificación, y especifique el tipo de línea límite al elegir las opciones Incluir o Excluir. Es decir, se puede tener un tipo de línea de ruptura con un límite de exclusión, o un tipo de línea de ruptura con un límite de inclusión.
Inicio de línea

Utilice este grupo para introducir el nombre del punto o las coordenadas Norte y Este para el inicio de la línea.

Nombre pto

Utilice este campo para identificar el punto inicial de la línea. Si éste es un valor de nombre de superficie válido los campos Norte y Este se rellenarán automáticamente.

NOTA: Si se introduce un valor de nombre de punto de superficie no válido se mostrará un mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Norte / Este

Utilice estos campos para introducir las coordenadas del punto inicial si no conoce el nombre del punto.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este para el inicio de la línea.

Fin de línea

Use este grupo para introducir el nombre de punto o las coordenadas Norte y Este para el final de la línea.

Nombre pto

Utilice este campo para identificar el punto final de la línea. Si éste es un valor de nombre de superficie válido los campos Norte y Este se rellenarán automáticamente.

NOTA: Si se introduce un valor de nombre de punto de superficie no válido se mostrará un mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Norte / Este

Utilice estos campos para introducir las coordenadas del punto de la superficie si no conoce el nombre del punto.

SUGERENCIA: Use Rellenar campo para introducir las coordenadas Norte y Este para el final de la línea.

NOTA: Si se introducen coordenadas que no coincidan con las del punto de superficie válido, la acción de Añadir línea no se activará.

Añadir

Haga clic en Añadir para agregar la línea a la superficie. El punto final se convertirá en el punto inicial de la línea siguiente. Añada otro punto final para continuar la línea.

SUGERENCIA: Si se está utilizando el relleno de campo para identificar el punto, haga doble clic en el punto final y la línea se agregará automáticamente.

ADVERTENCIA: Si se hace clic en Añadir no se actualizará la superficie. Haga clic en Actualizar superficie para que los tipos de líneas se apliquen a la superficie.

Actualizar superficie

Una vez añadidas las líneas, el indicador de actualización de la barra de estado cambiará para notificar que la superficie debe actualizarse.

Para actualizarla antes de cerrar el diálogo Añadir línea, haga clic en Actualizar superficie.

Para actualizarla una vez cerrado el diálogo anterior, presione F4 ó use el comando Diseño / Actualizar superficie.

Envoltura

Haga clic en Envoltura para crear un límite de inclusión que rodee a todos los puntos seleccionados para el modelo de curvas de nivel. Con este límite de inclusión generalmente no se obtiene una definición de límite todo lo detallada que uno desea, pero se facilita una definición inicial. Utilice Añadir línea y Eliminar línea para editar la definición inicial y crear la que se quiera.

SUGERENCIA: Utilice Editar / Deshacer para revertir la acción de Añadir línea.

Herramientas de Añadir línea

Las herramientas de Añadir línea de la barra Superficie le permiten agregar:

  Una línea de ruptura

  Un límite de exclusión

  Un límite de inclusión

  Un límite de inclusión con una línea de ruptura

  Un límite de exclusión con una línea de ruptura


Eliminación de líneas

Use la herramienta Eliminar línea [image] de la barra de herramientas Superficie o el comando Diseño / Eliminar línea para eliminar una línea del modelo de superficie de curvas de nivel.

Diseño / Eliminar línea

Utilice este comando para abrir el diálogo Eliminar línea. Este sólo estará disponible desde el comando del menú.

Tipos de línea a eliminar

Seleccione los tipos de línea a eliminar de la lista.

Los tipos disponibles son:

Tipos de línea	Esta opción …
Todos	elimina todas las líneas seleccionadas de la superficie que sean una línea de ruptura o un límite. En algunos casos una línea puede ser un límite y de ruptura. Esta es la opción por defecto.
Línea de ruptura	sólo elimina las líneas de ruptura que se seleccionen
Límites de inclusión	sólo elimina los límites de inclusión que se seleccionen
Límites de exclusión	sólo elimina los límites de exclusión que se seleccionen
Lím. de inclusión y líneas de ruptura	sólo elimina los límites de inclusión y líneas de ruptura que se seleccionen
Lím. de exclusión y líneas de ruptura	sólo elimina los límites de inclusión y las líneas de ruptura que se seleccionen

Inicio de línea

Utilice este grupo para introducir el nombre del punto o las coordenadas Norte y Este para el inicio de la línea.

Nombre pto

Utilice este campo para identificar el punto de inicio de la línea. Si éste es un valor de nombre de superficie válido los campos Norte y Este se rellenarán automáticamente.

NOTA: Si se introduce un valor de nombre de punto de superficie no válido se mostrará un mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Norte / Este

Utilice estos campos para introducir las coordenadas del punto de inicio si no conoce el nombre del punto. Estos campos son de sólo lectura o sea que no podrán introducirse coordenadas mediante el teclado.

Fin de línea

Use este grupo para introducir el nombre del punto o las coordenadas Norte y Este para el final de la línea.

Nombre pto

Utilice este campo para identificar el punto final de la línea. Si éste es un valor de nombre de superficie válido los campos Norte y Este se rellenarán automáticamente.

NOTA: Si se introduce un valor de nombre de punto de superficie no válido se mostrará un mensaje de error:

X no es un nombre de punto válido

Donde X es el nombre del punto.

Norte / Este

Utilice estos campos para introducir las coordenadas del punto final si no conoce el nombre del punto. Estos campos son de sólo lectura o sea que no podrán introducirse coordenadas mediante el teclado.

SUGERENCIA: Seleccione la línea en la ventana gráfica cuando el diálogo Eliminar línea esté activo y los campos de puntos inicial y final se introducirán automáticamente.

Aplicar

Haga clic en Aplicar para eliminar la línea.

Una vez que se haya seleccionado la línea a eliminar, el indicador de actualización de la barra de estado cambiará para indicar que la superficie debe actualizarse.

Para actualizar la superficie antes de cerrar el diálogo Eliminar línea, haga clic en Actualizar superficie.

Para actualizar la superficie después de cerrar el diálogo Eliminar línea, presione F4 ó utilice el comando Diseño / Actualizar superficie.

Haga clic en Cerrar para cerrar el diálogo.

SUGERENCIA: Use Editar / Deshacer para revertir la acción de Eliminar línea.

Herramienta Eliminar línea de ruptura / Límite

Para eliminar una línea de ruptura o límite utilizando la herramienta Eliminar línea:

1.	Haga clic en la herramienta Eliminar línea de ruptura / Límite [image] de la barra de herramientas Superficie.

2.	Haga clic en la flecha a la derecha de la herramienta para acceder a la lista de tipos de línea.

3. 	Seleccione los tipos de línea que desea eliminar.

La opción que seleccione de la lista actúa como un filtro y cuando se haga clic en una línea de la ventana gráfica, la línea se eliminará si es del tipo especificado. Esto resulta útil cuando hay más de una línea entre dos puntos y sólo quieren eliminarse las de un tipo en particular.

ADVERTENCIA: El tipo de línea que seleccione será el valor por defecto hasta que se seleccione otro tipo de línea para cerrar el software DTMLink™.

Cuando Eliminar línea esté habilitado el cursor cambiará a [image].

4.	Seleccione el límite o línea de ruptura a eliminar.

Una vez que se hayan eliminado líneas, el indicador de actualización de la barra de estado cambiará para indicar que la superficie necesita actualizarse.

5.	Para actualizar la superficie, presione F4, o utilice el comando Diseño / Actualizar superficie.

6.	Desactive la herramienta seleccionando otra diferente o presionando F2.

NOTA: Un caso en el que puede utilizarse el tipo de línea de inclusión de límites es el de un edificio que se encuentre en el límite de una superficie. Cuando se quiera editar el límite de inclusión sin afectar al de exclusión, seleccione los tipos de línea de límite de inclusión de la lista y elimine las líneas limítrofes apropiadas de la ventana gráfica.


Actualización de superficies

Una vez agregadas las líneas, el indicador de actualización de la barra de estado cambiará para indicar que la superficie necesita actualizarse.

Seleccione el comando Diseño / Actualizar superficie o presione F4 para actualizar la superficie y aplicar las líneas de ruptura y las líneas limítrofes que se hayan agregado.

Al hacer clic en Actualizar superficie en el diálogo Añadir línea también se actualizará la superficie.


Adición de límites de inclusión con la herramienta Añadir límite de inclusión

1.	Seleccione la herramienta Añadir límite de inclusión [image] de la barra de herramientas Superficie.

Cuando el comando esté habilitado el cursor cambiará a [image].

2.	Haga clic en el punto de la superficie donde empieza el límite.

3.	Continúe agregando secciones al límite de inclusión mediante la selección de puntos de la superficie.

En pantalla se mostrará una línea azul oscura entre los puntos del límite de inclusión.

4.	Vuelva al primer punto para cerrar el límite. Si no lo hace, el software DTMLink™ intentará cerrarlo cuando usted actualice la superficie.

Una vez añadidas las líneas, el indicador de actualización de la barra de estado cambiará para indicar que necesita actualizarse la superficie.

5.	Para actualizarla, siga uno de los siguientes pasos:

  Presione F4.

  Utilice el comando Diseño / Actualizar superficie.

6.	Para terminar de agregar al límite, seleccione otra herramienta o presione F2.

NOTA: Para agregar un límite de inclusión y una línea de ruptura utilizando la herramienta Añadir línea, presione la flecha a la derecha de la herramienta Límite de exclusión y seleccione Límite de inclusión y Línea de ruptura de la lista desplegable.


Adición de límites de exclusión con la herramienta Añadir límite de exclusión

Para agregar un límite de exclusión utilizando la herramienta Añadir límite de exclusión:

1.	Seleccione la herramienta Añadir límite de exclusión [image] de la barra de herramientas Superficie.

2.	Haga clic en el punto de la superficie donde empiece el límite.

Cuando dicho comando esté habilitado el cursor cambiará a [image].

3.	Continúe agregando secciones del límite de exclusión mediante la selección de puntos de la superficie.

En pantalla se mostrará una línea azul clara entre los puntos del límite de inclusión.

4.	Vuelva al primer punto para cerrar el límite. Si no lo hace, el software DTMLink intentará cerrarlo cuando usted actualice la superficie.

Una vez añadidas las líneas, el indicador de actualización de la barra de estado cambiará para indicar que necesita actualizarse la superficie.

5.	Para actualizarla, siga uno de los siguientes pasos:

  Presione F4.

  Utilice el comando Diseño / Actualizar superficie.

6.	Para terminar de agregar al límite, seleccione otra herramienta.

NOTA: Para agregar un límite de exclusión y una línea de ruptura utilizando la herramienta Añadir línea, presione la flecha a la derecha de la herramienta Límite de exclusión y seleccione Límite de exclusión y Línea de ruptura de la lista desplegable.


Límites y Líneas de ruptura : Información técnica

Esta sección trata sobre la creación de modelos digitales del terreno (MDT) así como señala algunos de los efectos que el procesamiento de líneas de ruptura y de límites produce en dicho modelo.

Cuando se crea una superficie, el software DTMLink™ forma triángulos entre los puntos de la superficie. Se asume que las líneas (que constituyen los bordes de los triángulos) formadas entre los puntos de la superficie tienen una pendiente constante.

Se abarcan los siguientes temas:

  Límites

 Líneas de ruptura

 Efecto del procesamiento de límites y líneas de ruptura

Visión general sobre límites

Hay dos tipos de límites: el de inclusión y el de exclusión. El primero es una línea que define un área de la superficie que está incluida en el modelo. El segundo es una línea que define un área de la superficie que debe excluirse del modelo. Por ejemplo, si los lados de un edificio se definiesen como un límite de exclusión, no se dibujarían líneas de contorno del edificio. Los límites de exclusión deberían definirse dentro de los de inclusión, pero si uno de inclusión se crea dentro de uno de exclusión, éste último prevalece sobre el de inclusión.

Un límite es una figura cerrada. Si por lo que sea usted no la cierra, DTMLink la intentará cerrar cuando la superficie se actualice.

Visión general sobre las líneas de ruptura

Las líneas de ruptura son una serie de líneas conocidas con pendiente constante. El software DTMLink™ utiliza la pendiente de cada línea para ajustar el modelo triangular. Por ejemplo, la parte superior de una ladera o el lateral de una carretera pueden definirse como una línea de ruptura para hacer que el software DTMLink deje de efectuar interpolaciones incorrectas por la línea. Obviamente, las líneas de ruptura no se cruzan entre sí a no ser que pasen por un punto común.

Tanto los límites como las líneas de ruptura se definen como una serie de líneas que ‘conectan’ puntos de la base de datos.

Efecto del procesamiento de límites y líneas de ruptura

Los límites y las líneas de ruptura hacen que vuelvan a formarse los triángulos del modelo. Las siguientes figuras demuestran cómo el software DTMLink reconstruye el modelo mediante la creación de líneas de ruptura y la formación de triángulos en la superficie.

NOTA: En toda esta sección, los límites y las líneas de ruptura que se muestran están entre los puntos A y B de la superficie. Los vértices del triángulo se numeran cuando se considera apropiado.

Ejemplo 1: Línea de ruptura que atraviesa un triángulo

La figura 1 representa un modelo simplificado y atípico de un triángulo y una línea de ruptura. Los puntos de ruptura X e Y se forman en la intersección del triángulo con la línea de ruptura.

Figura 1 Línea de ruptura simplificada

Las alturas para los puntos X e Y se interpolan a lo largo de la línea de ruptura entre los puntos A y B. Los puntos de ruptura entonces se convierten en los puntos de la superficie del modelo y se forman tres triángulos nuevos.

Ejemplo 2: Línea de ruptura que atraviesa triángulos múltiples

La figura 2 representa un modelo triangular con una línea de ruptura definida.

Figura 2 Cálculo (1)

La reconstrucción de triángulos sigue secuencialmente el trayecto de la línea de ruptura, en el que se inserta un punto de ruptura en cada una de las intersecciones de los lados del triángulo con la línea de ruptura. La figura también muestra los puntos de ruptura. Sus alturas correspondientes se interpolan a lo largo de la línea de ruptura entre los puntos A y B.

A continuación los puntos de ruptura pasan a formar parte del modelo de la superficie y se forman diez triángulos nuevos. Véase la Figura 3. El punto continuo muestra los nuevos triángulos formados.

Figura 3 Cálculo (2)

Ejemplo 3: Límite que atraviesa un triángulo

La figura 4 representa un modelo simplificado y atípico de un triángulo y un límite. Los puntos de ruptura X e Y resultan de la intersección entre el triángulo y la línea de ruptura. Asúmase que el vértice del triángulo (etiquetado 1) está dentro del límite y los vértices (marcados 2 y 3) se salen del mismo.

Figura 4 Límite (1)

La altura del punto X resulta de la interpolación entre los puntos 1 y 3. La del punto Y de la interpolación entre 1 y 2. El triángulo se forma entre X, Y, y 1 y los puntos 2 y 3 se descartan del modelo de superficie.

La figura 5 muestra un caso parecido donde un límite atraviesa un triángulo ya formado. Una vez más, asuma que el punto 1 se encuentra dentro del límite.

La altura del punto X se interpola entre los puntos 1 y 3. La del punto Y entre los puntos 1 y 2.

Figura 5 Límite (2)

Se forman dos nuevos triángulos y los puntos 2 y 3 se eliminan de la superficie y se forman triángulos nuevos.

Ejemplo 4: Combinación de un límite y una línea de ruptura para atravesar un triángulo

Una línea puede presentar tanto características de límite como de línea de ruptura. Véase la figura 6.

Figura 6 Límite y línea de ruptura

Los puntos de ruptura se crean en los puntos X e Y resultado de la intersección entre el triángulo y la línea de ruptura.

Como la línea A B es tanto una línea de ruptura como un límite, las alturas de los puntos X e Y se interpolan a lo largo de la línea de ruptura entre los puntos A y B.

Dado que el vértice 1 se encuentra dentro del límite, se forma el triángulo definido por los puntos 1, X, e Y. Los puntos 2 y 3 se descartan del modelo.


Eliminar todas
 Diseño / Eliminar todas

Utilice este comando para eliminar todos los límites o líneas de ruptura de una superficie.

Aparecerá un mensaje de aviso.

Esta operación no puede deshacerse. Haga clic en Aceptar para quitar todos los límites y líneas de ruptura de esta superficie.

Haga clic en Aceptar si está seguro/a de que quiere eliminar todos los límites y líneas de ruptura permanentemente.

Cuando haga clic en Aceptar se actualizará la superficie.


Adición de líneas de ruptura con la herramienta Añadir L.ruptura

Para agregar una línea de ruptura utilizando la herramienta Añadir L.ruptura:

1.	Haga clic en la herramienta Añadir L.ruptura [image] de la barra de herramientas Superficie.

Cuando el comando esté habilitado el cursor cambiará a [image].

2.	Haga clic en el punto de la superficie donde empieza la línea de ruptura.

3.	Continúe agregando secciones de la línea de ruptura mediante la selección de puntos de la superficie.

En la pantalla se dibujará una línea roja entre los puntos seleccionados de la superficie.

Tras agregar líneas, el indicador de actualización de la barra de estado cambiará para indicar que la superficie necesita actualizarse.

4.	Para actualizar la superficie siga uno de los siguientes pasos:

  Presione F4.

  Use el comando Diseño / Actualizar superficie.

5.	Para terminar de añadir a la línea de ruptura, seleccione otra herramienta o presione F2.

Para agregar otra línea de ruptura:

  Haga clic en la herramienta Añadir L.ruptura de nuevo y repita los pasos 1 al 5 anteriormente mencionados.

SUGERENCIA: Agregue una línea de ruptura y un límite utilizando la:

  Herramienta Límite de inclusión

  Herramienta Límite de exclusión

Seleccione el límite y la línea de ruptura del menú desplegable.


Menú Diseño

Utilice el menú Diseño para editar una superficie. Tiene los siguientes comandos:

Incluir punto

Excluir punto

Cambiar triángulos

Eliminar triángulo

Añadir línea

Actualizar superficie

Eliminar línea

Eliminar todas


Asistencia técnica

Si tiene algún problema y no puede encontrar la información que necesita en la documentación del producto, póngase en contacto con su distribuidor local.

Alternativamente, solicite asistencia técnica utilizando el sitio de Trimble en la web (http://www.trimble.com/support.html/


Marcas registradas

Trimble con el logo de Trimble es una marca registrada de Trimble Navigation Limited, registrada en la Oficina de Patentes y Marcas de los Estados Unidos.

DTMLink, RoadLink, Trimble Geomatics Office y Trimble Survey Controller son marcas registradas de Trimble Navigation Limited.

Microsoft, MS-DOS, Windows, Windows 95, Windows 98 y Windows NT son marcas o marcas registradas de Microsoft Corporation.

AutoCAD es una marca registrada de Autodesk Inc.

Todas las otras marcas son de propiedad de sus respectivos titulares.


Garantías

Absolución de responsabilidades

Excepto lo indicado en la “Garantía Limitada”, el Hardware, Software, Firmware y documentación de Trimble se provee “tal y como” y sin garantía expresa o limitada de ningún tipo ni por Trimble Navigation Limited ni por ninguno de los involucrados en su creación, producción, o distribución que incluyen pero no limitan las garantías de comercialización implicadas y de uso para un propósito en particular. Todo el riesgo, en lo concerniente a la calidad y funcionamiento del Hardware, Software, Firmware y documentación de Trimble, reside en usted. Algunos estados no permiten la exclusión de garantías implicadas, de forma que la exclusión arriba mencionada puede que no le afecte a usted.

Limitación de responsabilidad

En ninguna situación, Trimble Navigation Limited o cualquier persona involucrada en la creación, producción, o distribución del software de Trimble será responsable de reclamos de ningún tipo de daño, incluyendo la pérdida de beneficios, pérdida de ahorros, u otros daños especiales, fortuitos, consecuentes o ejemplares, que incluyen pero no limitan los daños evaluados por terceros o que usted haya pagado a terceros y que surjan del uso, responsabilidad por uso, calidad o funcionamiento de tales documentos y software de Trimble, incluso si Trimble Navigation Limited o cualquier persona o entidad ha sido avisada de la posibilidad de tales daños, o de algún reclamo por otros. Algunos estados no aceptan la limitación o exclusión de responsabilidad por daños fortuitos o consecuentes por lo que las limitaciones antes mencionadas puede que no le afecten a usted.

Garantía limitada del firmware y del software

Trimble Navigation Limited garantiza que los productos de software y firmware cumplen de forma substancial con las especificaciones publicadas siempre y cuando se utilicen con los productos de Trimble Navigation Limited, ordenadores, y el sistema operativo para el cual se diseñaron. Durante el periodo de noventa (90) días, comenzando treinta (30) días tras el envío desde Trimble Navigation Limited, también se garantiza que los medios magnéticos en los que se distribuye el software y el firmware están libres de defectos en cuanto a materiales y fabricación. Durante el periodo de garantía de noventa (90) días, Trimble Navigation Limited reemplazará los medios o documentos estropeados, o corregirá errores sustanciales de programas gratis. Si Trimble Navigation Limited es incapaz de reemplazar los medios o documentos estropeados, o de corregir los errores en los programas, le reembolsará el precio total que pagó por el software. Estos son los únicos remedios para cualquier infracción de la garantía.

Garantía limitada del hardware

Los productos de Trimble Navigation Limited están garantizados respecto a defectos de material y fabricación durante el periodo de un año. El periodo de garantía comenzará treinta (30) días tras el envío por la empresa Trimble Navigation Limited. El servicio de garantía se proveerá en un Centro de Servicio Técnico Trimble designado durante el periodo de garantía. Trimble Navigation Limited optará bien por reparar o bien por reponer los productos que prueben estar defectuosos. El cliente pagará todos los costos de envío de los productos mandados a Trimble para su servicio de garantía. Trimble Navigation Limited pagará todos los costos que suponga el envío de los productos reparados al cliente.

La garantía arriba expuesta no cubre los defectos que resulten de:

1. Mantenimiento inapropiado o inadecuado por parte del comprador
2. Software o interfaces suministradas por el comprador
3. Mal uso o modificación no autorizada
4. Manejo fuera de las especificaciones medio ambientales del producto
5  Instalación inapropiada, cuando sea pertinente
6. Rayos u otras descargas eléctricas
7  Pulverización (rociado) o inmersión en agua dulce o salada
8. Desgaste y fallos normales de las partes no duraderas (por ejemplo, baterías)

No se expresa o implica ningún otro tipo de garantía.Trimble Navigation Limited renuncia específicamente a las garantías implicadas en el ajuste de equipo para un propósito particular y su comercialización.


Sitio en World Wide Web

Para echar un vistazo interactivo en Trimble, visite nuestro sitio en World Wide Web (http://www.trimble.com/)


Comentarios

Le agradecemos la adquisición de este producto. Agradeceríamos también cualquier comentario con respecto al mismo. Se ruega envíe sus comentarios y sugerencias a:

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642
Sunnyvale, CA 94086
EE.UU.

Teléfono: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
http://www.trimble.com/

Si tiene algún comentario acerca de esta documentación, por favor contáctenos. Sus comentarios nos ayudarán a mejorar futuras revisiones. Todos aquellos que contribuyen con evaluaciones especialmente útiles recibirán un obsequio en agradecimiento.

Envíe sus comentarios y sugerencias a la dirección anterior o envíe un email a ReaderFeedback@trimble.com

Todos los comentarios y sugerencias serán propiedad de Trimble Navigation Limited.