Copyright: ©1999-2002 Trimble Navigation Limited. All rights reserved.
Citation: ©1999-2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office -Visión de conjunto

Trimble Geomatics Office le permite integrar datos de diversas técnicas topográficas, incluyendo GPS (RTK y con posprocesamiento), instrumentos convencionales/ópticos (incluyendo servo y robóticos), niveles y lásers. Las herramientas para el control de calidad extensivo le permiten completar tareas de transferencia de datos imperceptible entre el campo y la oficina de forma más rápida y eficaz.

Use Trimble Geomatics Office para:

  Procesamiento de líneas base GPS (si tiene instalado el módulo WAVE Baseline Processing de Trimble)

  Ajuste de redes topográficas (si tiene instalado el módulo Network Adjustment)

  Procesamiento de datos topográficos convencionales y GPS

  Seguro y control de calidad de datos (SC/CC)

  Importación y exportación de datos de diseño vial

  Importación y exportación de datos topográficos

  Modelado digital y diseño de curvas de nivel del terreno

  Transformaciones de datum y proyecciones

  Captura de datos GIS y exportación de datos

  Codificación de características

  Informes sobre proyectos

  Administración de proyectos topográficos

Características principales

Las características principales del software Trimble Geomatics Office (versión 1.6) son:

  Las vistas del levantamiento y del plano, que visualizan los datos del proyecto en la ventana gráfica

  La barra de proyectos, que organiza tareas frecuentemente utilizadas con métodos de acceso directo en la ventana gráfica

  Filtros de vista que le permiten visualizar u ocultar los tipos de observación

  Funciones para el ‘arrastre y colocación’ que le permiten arrastrar y colocar cualquier archivo de trabajo del escritorio en la zona del proyecto

  Importación de datos capturados de receptores GPS y/o estaciones totales convencionales

  Formatos para importar y exportar comunes

  El diálogo Comprobar DAT, que le permite comprobar y editar datos brutos GPS antes de importarlos

  La ventana Propiedades, que le permite ver y editar toda la información de puntos relacionada así como todos los tipos de observación

  El diálogo Edición múltiple, que facilita la edición rápida de entidades múltiples

  Soporte de captura de datos GIS

  Soporte de capas para la administración de datos CAD

  Informes HTML presentados profesionalmente

  Formatos de informe estándar y personalizados

  Los módulos RoadLink y DTMLink, que permiten la visualización y edición de otros archivos de diseño vial así como la creación de modelos digitales del terreno.

NOTA: Trimble Geomatics Office no soporta los sistemas de nomenclatura de archivo 8.3.

Módulos

A continuación se describen los módulos opcionales que hay disponibles con Trimble Geomatics Office:

  el módulo WAVE Baseline Processing calcula líneas base a partir de observaciones de campo GPS utilizando procedimientos de captura de datos estático, estático rápido, o cinemático. El procesador de líneas base WAVE proporciona controles flexibles y procesamiento predeterminado para el procesamiento avanzado. Timeline visualiza datos GPS de archivos de observaciones brutas en un formato gráfico en función del tiempo. Utilícelo para ver y editar mediciones brutas GPS e información topográfica.

  el módulo Network Adjustment ajusta los datos topográficos GPS y terrestres con el fin de calcular y reducir los errores inherentes.

¿Qué es la Geomática?

La geomática se refiere al diseño, captura, almacenamiento, análisis, visualización, y recuperación de información espacial. La captura de información espacial puede proceder de diversas fuentes, que incluyan métodos GPS y métodos terrestres. La geomática integra las técnicas topográficas tradicionales con nuevos enfoques tecnológicos, por lo que resulta útil en gran variedad de aplicaciones.


Quitar el software

PRECAUCION: El proceso descrito en este tema quita todos los archivos excepto los comunes, las plantillas, y los archivos de datos. Para eliminar archivos de datos utilice el Explorador de Microsoft Windows.

Para quitar Trimble Geomatics Office de su computadora:

1.	Seleccione Inicio / Configuración / Panel de control.

2.	Desde el panel de control, elija Añadir/quitar programas. Aparece el diálogo Añadir/quitar programas.

3.	Asegúrese de que la ficha Instalar/Desinstalar esté activa.

4.	Seleccione Trimble Geomatics Office.

5.	Haga clic en Añadir/Quitar. Aparece el mensaje de confirmación de la eliminación de archivos.

6.	Haga clic en Sí. Se eliminarán los archivos.

PRECAUCION: Si desinstala Trimble Geomatics Office se perderán todos los formatos personalizados. Por ejemplo, si ha añadido tipos de símbolo a la biblioteca de símbolos creada por el sistema (Symbols.sym) o añadido formatos para importar/exportar personalizados, estos se perderán.

Los archivos siguientes almacenan información personalizada:

  archivos de definición de formato de plano (*.frm) — personalizados al editar este archivo con un editor de texto

  archivos de formato de informe (Asciirpt.dat) — adaptados al crear archivos personalizados

  archivos de definición para importar ASCII (Asciiimp.dat) — adaptados al crear formatos de importación personalizados

  archivos de definición para exportar ASCII (Asciiexp.dat) — adaptados al crear formatos de exportación personalizados

  biblioteca de símbolos creada por el sistema (Symbols.sym) − personalizada al guardar nuevos tipos de símbolo en este archivo

 biblioteca de tipos de línea creada por el sistema (Linetype.ltp) − personalizada al guardar nuevos tipos de línea en este archivo


Estructura de carpetas

Durante la instalación, todos los archivos que Trimble Geomatics Office necesita se copian a las carpetas que se listan a continuación:

Carpeta	Lo que almacena
\Archivos de programa\Trimble\ Trimble Geomatics Office	Archivos de ayuda y de programa de Trimble Geomatics Office
...\Sistema	Los archivos de sistema incluyen los archivos del software de la biblioteca de características y atributos, las utilidades Symbol Editor™ y Line Type Editor™ y las plantillas de informe HTML
...\Plantilla	Archivos de la plantilla del proyecto
...\Utilidad	Se vincula a las utilidades A1 Viewer, Convert to RINEX™, Coordinate System Manager™, Data Transfer, DC File Editor™, Feature and Attribute Editor™, Line Type Editor, Planning y Symbol Editor
...\RoadLink - DTMLink	Archivos de programa y archivos asociados de RoadLink y DTMLink
\Archivos de programa\Archivos comunes\ Trimble	Archivos usados por Trimble Geomatics Office y otros productos de Trimble.
...\GeoData	Información sobre el sistema de coordenadas y archivos de geoide
...\GeoDB	Archivos de programa de Coordinate System Manager
...\Data Transfer	Archivos de programa de Data Transfer
...\DatToRinex	Archivos de programa de Convert to RINEX
...\Dceditor	Archivos de programa de DC File Editor
...\Plan	Archivos de programa de Planning


Acerca de Trimble

Trimble es el innovador mundial en la tecnología del Sistema de Posicionamiento Global (GPS). Además de proveer componentes GPS avanzados, Trimble incrementa el GPS con otras tecnologías de posicionamiento así como también comunicaciones inalámbricas y software para crear soluciones completas para los clientes. Las aplicaciones emergentes de Trimble incluyen la topografía, la navegación en automóviles, la guía de máquinas, el rastreo de bienes, plataformas inalámbricas e infraestructura en telecomunicaciones.

Fundada en 1978, Trimble posee más de 200 patentes estadounidenses sobre GPS y tecnología relacionada, con un número superior a 180 patentes adicionales pendientes.

Las oficinas corporativas de Trimble se ubican en 645 N. Mary Avenue en Sunnyvale, CA.

Con el fin de ofrecer un mejor servicio Trimble también tiene oficinas en varias ciudades del mundo .

Trimble ha beneficiado el GPS desde 1984.

Para una mirada interactiva sobre Trimble, visite el sitio correspondiente en el World Wide Web:

www.trimble.com


Comando Inverso

Utilice este comando para determinar el inverso entre dos puntos de un proyecto.

Para acceder al mismo, seleccione Levantamiento / Inverso.

Aparece el diálogo Inverso.


Diálogo Inverso

Utilice este diálogo para determinar el inverso entre dos puntos de un proyecto. Puede utilizar el diálogo para ver información breve o detallada sobre el inverso y generar un informe.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione / Inverso.

  Presione F7.

NOTA: La herramienta Inverso sólo funciona cuando existen puntos. Para visualizar acimutes y distancias entre cualquier otra posición de coordenadas, utilice la herramienta Medir. Para acceder a la misma, seleccione Levantamiento / Medir.

De

Introduzca un nombre de punto desde el teclado, o utilice Rellenar campo para hacer clic en un punto.

A

Introduzca un nombre de punto desde el teclado, o utilice Rellenar campo para hacer clic en un punto.

Cuando aproxime el puntero a otro punto, aparece una línea de guiones. Esta muestra el inverso a calcular. Cuando haga clic en el segundo punto, la línea de guiones cambia a una línea continua. Esta muestra la línea con los detalles del inverso.

Si la configuración Mostrar distancia en la ficha Unidades y formato del cuadro de diálogo Propiedades Proyecto se especifica en distancia de cuadrícula o en distancia de nivel de mar, y los dos puntos no tienen elevaciones, se visualizan la distancia de cuadrícula y el acimut. Sin embargo, si el campo Mostrar distancia como campo se configura a Distancias terreno, y ambos puntos inversos tienen elevaciones nulas, entonces la distancia se muestra como nula (si la elevación por defecto se ha configurado como nula). Sin ninguna información de elevación, es imposible calcular la distancia del terreno.

Cuadrícula Acimut

Este campo muestra el acimut de cuadrícula entre los puntos.

Cuadrícula Distancia

Este campo muestra la distancia de cuadrícula entre los puntos.

Incremento de elevación

Cuando ambos puntos tienen elevaciones, se muestra el incremento de elevación. Si se desconocen ambas elevaciones, el campo se muestra nulo.

Método

Hay dos métodos disponibles para calcular el inverso:

Secuencial	Para calcular una secuencia de inversos consecutivos.

Radial	Para calcular una secuencia de inversos que radian de un punto inicial común.

Calcular

Haga clic en Calcular para calcular el inverso si se ha utilizado el teclado para introducir los puntos seleccionados.

Enviar al informe

Haga clic en Enviar al informe para crear un informe del cálculo del inverso. En función de la opción de presentación utilizada para el inverso puede generarse un informe detallado o breve.

NOTA: Si el informe se ha generado desde una opción de presentación y a continuación regenerado en la otra modalidad, la información del inverso detallada en el informe se añade al informe existente.

Mostrar informe

Haga clic en Mostrar informe para ver el informe del inverso creado.

El informe breve muestra la información del Inverso tal como se muestra en el diálogo Inverso en modo abreviado.

El informe detallado muestra las posiciones de los puntos “De” y “A” en los sistemas de coordenadas local (geodésico), y cartesiano (WGS-84), así como los valores del inverso y los parámetros utilizados para reducir el inverso en esos sistemas de coordenadas.

Detallado / Breves

Haga clic en Detallado para mostrar el grupo Detalles. Cuando se visualice este grupo, el botón cambia a Breves. Haga clic en Breves para ocultar el grupo Detalles.

Detalles

Este grupo muestra información adicional en el inverso.

Acimut ant SN

Este campo muestra el rumbo (geodésico) de entrada de la sección normal desde el primer al segundo punto.

Acimut post SN

Este campo muestra el rumbo (geodésico) de salida de la sección normal desde el segundo al primer punto.

Distancia elipsoide

Este campo muestra la distancia elipsoidal entre puntos.

Distancia del terreno

Este campo muestra la distancia del terreno entre puntos.

Incremento altura

Este campo muestra el incremento de altura entre puntos.


Comando Medir

Utilice este comando para medir acimutes, distancias, y áreas desde cualquier ventana gráfica.

Para acceder al mismo, seleccione Levantamiento / Medir.

Aparece el diálogo Medir.


Diálogo Medir

Utilice este diálogo para medir acimutes, distancias, y áreas desde cualquier ventana gráfica.

Para acceder al mismo, seleccione Levantamiento / Medir.

Usted puede medir entre puntos o posiciones del proyecto en la pantalla. (Haga clic en la posición apropiada.)

Una vez seleccionadas dos o más posiciones, la distancia acumulada entre la primera y última posición se muestra en el campo Distancia. El campo Acimut muestra el acimut entre las dos últimas posiciones seleccionadas.

SUGERENCIA: Si se hace clic y arrastra el ratón, los campos muestran el acimut, la distancia acumulada desde el primer punto seleccionado, y el área cubierta.

Acimut

Cuando se seleccionan dos posiciones, se muestra la cuadrícula acimut entre dos puntos. Con tres o más puntos seleccionados, este campo muestra el acimut entre los dos últimos puntos.

Distancia

Cuando se seleccionan dos posiciones, se muestra la distancia entre dos puntos. Con tres o más puntos seleccionados, este campo muestra el total acumulado (suma) de las distancias medidas.

En función de las configuraciones de presentación elegidas el informe sobre el total de las distancias varía.

NOTA: Si el campo Mostrar distancia como del diálogo Propiedades proyecto se configura a Distancias terreno, y ambas posiciones medidas tienen elevaciones nulas, la distancia se muestra como nula (si la elevación por defecto se configura a nula). Si no hay información de elevación, el software no puede calcular la distancia del terreno.

Area

Con tres o más puntos seleccionados, se muestra el área de la figura formada al cerrarse la unión con el primer punto.

El área calculada varía en función de las configuraciones de presentación de distancia:

  Una configuración de distancia del terreno genera un área calculada a elevación media del terreno.

  Una configuración de distancia de nivel de mar genera un área calculada en la superficie del elipsoide.

 Una configuración de distancia de cuadrícula genera un área calculada a partir de las coordenadas de la cuadrícula.

Restaurar

Haga clic en Restaurar para borrar el contenido de todos los campos. Esto también puede realizarse haciendo doble clic en el punto de inicio.

SUGERENCIA: Usted puede determinar rápidamente qué porción del proyecto se muestra en la ventana de gráficos viendo el indicador de dimensiones [image] de la ventana de gráficos en la barra de estado. Para visualizar este indicador, mantenga el cursor fuera de la ventana de gráficos.

Al utilizar el puntero [image] presione Ctrl. Ello evitará que salte a un punto cercano.


Transformación de coordenadas - Visión de conjunto
Transformación de coordenadas − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Una transformación de coordenadas desplaza los puntos del proyecto. Esta puede involucrar desplazamientos, rotaciones, y escalado en dos dimensiones. Los puntos que tengan una calidad de Control o calidad de Ajustado no se mueven. Si usted ha movido uno de estos dos últimos tipos de puntos se muestra un mensaje.

La transformación de coordenadas se utiliza cuando, por ejemplo, hay puntos en el proyecto que proceden de otro módulo de software y están en un sistema de coordenadas dado, y usted necesita transformar dichos puntos para obtener las coordenadas correctas a utilizar.

Para definir la transformación de coordenadas, se puede llevar a cabo uno de los siguientes pasos:

  Utilizando Rellenar campo. Haga clic en los puntos, y a continuación introduzca sus propios valores de coordenadas. Si se utilizan más de tres puntos, el software usa el método de mínimos cuadrados para calcular los parámetros de transformación de los puntos seleccionados.

  Especifique los parámetros de transformación.

Cuando usted realice una transformación de coordenadas, todas las otras observaciones del punto están inhabilitadas. Las coordenadas de cuadrícula, las locales, y las WGS-84 visualizadas de los puntos transformados se cambian, pero el sistema de coordenadas no.

Una vez realizada la transformación, usted puede crear un informe que muestre los valores de coordenadas originales y los transformados.


Comando Transformación de coordenadas

Utilice este comando para determinar y aplicar una transformación horizontal.

Para acceder al mismo, seleccione Levantamiento / Transformación de coordenadas.

Aparece el diálogo Transformación de coordenadas.


Diálogo Transformación de coordenadas

 Visión de conjunto y más información

Utilice este diálogo para determinar y aplicar una transformación horizontal.

Para acceder al mismo, seleccione Levantamiento / Transformación de coordenadas.

Para introducir valores en este diálogo, realice uno de los siguientes pasos:

  Haga clic en Lista de puntos para seleccionar los puntos del proyecto con coordenadas conocidas e introduzca los valores conocidos para cada punto. El software calcula los parámetros de transformación. Si hay más de tres valores de punto, se utiliza el método de mínimos cuadrados. Las estadísticas se muestran en la lista de puntos para ayudarle a evaluar si ha añadido correctamente puntos a la lista. El diálogo Transformación de coordenadas muestra los valores de transformación.

  Introduzca los valores con el teclado.

Cuando ejecute una transformación de coordenadas, todas las otras observaciones del punto  se inhabilitan. Las coordenadas visualizadas de cuadrícula, local, y WGS-84 de los puntos transformados cambian. El sistema de coordenadas no cambia.

Traslación Este

Muestra la traslación Este (positiva) u Oeste (negativa).

Traslación Norte

Muestra la traslación Norte (positiva) o Sur (negativa).

Rotación

Muestra la rotación angular a aplicar en la transformación.

Escala

Muestra el cambio de escala de la transformación.

Origen de rotación

Los campos siguientes muestran la posición del centro de rotación.

Punto	Muestra el nombre del punto a utilizar como el punto de origen de la rotación. Si se introduce un nombre de punto, las coordenadas se visualizan en los campos Norte y Este. Si se utiliza Lista de puntos para calcular los parámetros, este campo muestra la media de coordenadas de la lista de puntos.
Norte	Muestra la coordenada Norte del punto de origen.
Este	Muestra la coordenada Este del punto de origen.
Transformación

Para transformar los puntos, seleccione una de las siguientes opciones:

Selección	Aplica la transformación a los puntos seleccionados.
Toda base datos	Aplica la transformación a todos los puntos del proyecto.
Cuando no se selecciona ningún punto, estas opciones no están disponibles y se transforman todos los puntos.

Generar el informe de ajuste de elevación

Seleccione esta casilla de verificación para crear un informe de los valores de las coordenadas originales y de las transformadas. El informe se muestra en el visor HTML predeterminado.

Lista de puntos

Haga clic en Lista de puntos para seleccionar los puntos de control. Introduzca los valores conocidos de los puntos.

Aparece el diálogo Lista de puntos.


Cuadro de diálogo Transformación de coordenadas - Lista de puntos

 Visión de conjunto y más información

Utilice el cuadro de diálogo Transformación de coordenadas – Lista de puntos para seleccionar puntos utilizados en el cálculo de los parámetros de la transformación de coordenadas. Usted selecciona los puntos, Trimble Geomatics Office muestra las coordenadas actuales y usted introduce las coordenadas conocidas. Trimble Geomatics Office calcula los parámetros de transformación, y a continuación aplica la transformación a los puntos que usted ha seleccionado.

Para acceder al mismo:

1.	Seleccione Levantamiento / Transformación de coordenadas. El cuadro de diálogo Transformación de coordenadas aparece.

2.	Haga clic en Lista de puntos.

Este diálogo presenta una lista de desplazamiento con todos los puntos. Cada punto tiene campos que muestran las coordenadas actuales y campos que muestran las coordenadas conocidas. Introduzca el nombre de punto y aparecerá el Norte actual y el campo Este actual. A continuación introduzca las coordenadas conocidas en los campos Norte conocido y Este conocido.

SUGERENCIA: Puede dejar el nombre del punto en blanco y utilizar Rellenar campo para introducir las coordenadas actuales.

No hay límite respecto al número de definiciones de posición que pueden definirse para una transformación de coordenadas. Al añadir demasiadas definiciones de posición no siempre se mejoran los resultados de transformación calculados, pero sí se proporcionan comprobaciones adicionales sobre la validez de los parámetros calculados.

Estadísticas

El Grupo Estadísticas muestra el factor de escala y el residual horizontal máximo. Use éstas estadísticas para revisar si ha introducido algún valor incorrecto.

Insertar

Haga clic en Insertar para insertar un registro de definición de posición vacía. Generalmente, Trimble Geomatics Office añade en forma automática los campos de definición de los puntos nuevos, de forma que usted no necesita utilizar este botón con frecuencia. Sin embargo, ya que el primer punto de la lista de puntos se utiliza como el origen de rotación de los parámetros de transformación calculados, es posible que usted quiera insertar una definición de posición al principio de la lista.

Eliminar

Haga clic en Eliminar para quitar una definición de posición de la lista.


Ajuste de elevación - Visión de conjunto
Ajuste de elevación − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también

Un ajuste de elevación ajusta las elevaciones de los puntos.

Una vez que se ha realizado el ajuste, Trimble Geomatics Office aplica el ajuste de elevación utilizando uno de los métodos siguientes:

  Cuando se introduzcan las elevaciones conocidas de los puntos existentes, Trimble Geomatics Office calcula los parámetros del ajuste de elevación.

 Cuando se introduzca una constante (positiva o negativa), Trimble Geomatics Office aplica el ajuste a todos los puntos seleccionados.

NOTA: El ajuste de elevación no se aplicará si la calidad de la altura o elevación es de tipo control o ajustada.

Resultados del ajuste de elevación

Cuando se realice un ajuste de elevación, se inhabilitan todas las otras observaciones del punto o posiciones de la cuadrícula de un punto. Las coordenadas visualizadas de cuadrícula, local, y WGS-84 de los puntos transformados cambian. El sistema de coordenadas no cambia.

La siguiente tabla muestra los parámetros calculados cuando se incluyen varias elevaciones en la lista de puntos:

NOTA: El ajuste de elevación calculado no se incluye en la definición del sistema de coordenadas, a diferencia del ajuste vertical que puede efectuarse en Levantamiento / comando Calibración local GPS.

Usted puede crear un informe que muestre la elevación original, la ajustada, y la diferencia entre ambas.


Comando Ajuste de elevación

Utilice este comando para determinar y aplicar un ajuste de elevación.

Para acceder al mismo, seleccione Levantamiento / Ajuste de elevación.

Aparece el diálogo Ajuste de elevación.


Diálogo Ajuste de elevación

 Visión de conjunto y más información

Utilice este diálogo para determinar y aplicar un ajuste de elevación.

Para acceder al mismo:

  Seleccione Levantamiento / Ajuste de elevación.

Para ajustar las elevaciones de los puntos del proyecto seleccionados, utilice uno de los siguientes métodos:

  Método Constante

  Método Parámetros del plano (introduzca los valores o seleccione los puntos)

Constante

Seleccione esta opción para añadir un valor constante a las elevaciones de los puntos. Aplique la constante a los valores seleccionados o a todo el proyecto.

Añadir a elevación

Este campo está disponible cuando usted selecciona la opción Constante. Introduzca un valor de elevación positivo o negativo para añadir a los puntos.

Parámetros

Seleccione esta opción para especificar o calcular los parámetros del ajuste de elevación de un plano inclinado. Para seleccionar los puntos de control para calcular los parámetros, haga clic en Lista de puntos.

Punto origen

Muestra el nombre del punto a utilizar como el punto de origen del plano inclinado.

NOTA: Si se utiliza Lista de puntos para seleccionar puntos para el cálculo de los parámetros, este campo muestra el primer punto de control seleccionado.

Este origen

Muestra la coordenada Este del punto de origen. Si selecciona un punto en el campo Origen punto, este campo se completa con la coordenada del punto seleccionado.

Norte origen

Muestra la coordenada Norte del punto de origen. Si selecciona un punto en el campo Origen punto, este campo se completa con la coordenada del punto seleccionado.

Constante de corrección

Muestra la corrección de elevación aplicada a la posición del origen.

Pendiente Norte

Este valor define la pendiente del plano en la dirección Norte-Sur. El ajuste de elevación se calcula a partir de este valor en partes por millón (ppm) y la distancia (en dirección Norte-Sur) desde el origen. Se aplica además de la constante de corrección.

Pendiente Este

Este valor define la pendiente del plano en la dirección Este-Oeste. El ajuste de elevación se calcula a partir de este valor en partes por millón (ppm) y la distancia (en dirección Este-Oeste) desde el origen. Se aplica además de la constante de corrección.

Lista de puntos

Haga clic en Lista de puntos para seleccionar los puntos de control a utilizar para calcular los parámetros del ajuste de elevación. Aparece el diálogo Lista de puntos.

Ajustar

Seleccione esta opción para aplicar el ajuste. Hay dos opciones disponibles:

Selección	Seleccione esta opción para aplicar el ajuste a los puntos seleccionados.
Toda la base datos	Seleccione esta opción para aplicar el ajuste a todos los puntos del proyecto.
Cuando no se haya seleccionado ningún punto, los botones de selección no estarán disponibles y el ajuste se aplicará a todos los puntos del proyecto.

Generar el informe de ajuste de elevación

Seleccione esta casilla de verificación para crear un informe de los valores de las elevaciones originales y de las ajustadas. El informe se muestra en el visor HTML predeterminado.


Diálogo Ajuste de elevación - Lista de puntos

 Visión de conjunto y más información

Trimble Geomatics Office utiliza los puntos seleccionados en este diálogo para calcular los parámetros del ajuste de elevación. Seleccione los puntos conocidos del proyecto e introduzca las elevaciones conocidas que les corresponda.

Para acceder a este diálogo:

1.	Seleccione Levantamiento / Ajuste de elevación. El cuadro de diálogo Ajuste de Elevación aparece.

2.	Haga clic en Lista de puntos.

Seleccione todos los puntos de control, con Rellenar campo o introduciéndolos con el teclado, e introduzca la elevación conocida.

SUGERENCIA: Los campos del sistema de coordenadas y elevación pueden completarse con Rellenar campo con el fin de elegir los puntos apropiados de la pantalla.

Generalmente, usted introduce tres o más puntos de control. Estos puntos deben estar distribuidos por igual alrededor del perímetro de los puntos a ajustar.

No hay un límite específico sobre el número de puntos que pueden definirse para calcular un ajuste de elevación. Al añadir demasiadas definiciones de posición no siempre se mejoran los resultados del ajuste calculados, pero sí se proporcionan comprobaciones adicionales sobre la validez de los parámetros calculados.

Estadísticas

El grupo Estadísticas muestra la inclinación máxima de ajuste y el residual vertical máximo. Utilice éstas estadísticas para revisar si introdujo algún valor incorrecto.

Insertar

Haga clic en Insertar para insertar un registro de definición de punto. Generalmente, Trimble Geomatics Office añade de forma automática los campos de definición de los puntos nuevos, de forma que usted no necesita utilizar este botón con frecuencia. Sin embargo, ya que el primer punto de la lista de puntos se utiliza como el punto de origen del ajuste de elevación, usted puede utilizar esta función para ubicar un punto al principio de la lista de puntos que quiera. No obstante, la posición utilizada para el origen del ajuste generalmente no es significativa.

Eliminar

Haga clic en Eliminar para quitar una definición de punto de la lista.


Comando Deshacer

Utilice este comando para revertir acciones.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Deshacer.

  Presione Ctrl+Z.

En el menú Editar, el texto que aparece al lado del comando Deshacer muestra la acción a deshacer. Puede deshacerse una acción por vez. Primero se deshace la efectuada más recientemente. Si deshace una acción sin darse cuenta, utilice el comando Repetir.

Si cierra el proyecto, o Trimble Geomatics Office, no podrá deshacer ninguna de las acciones realizadas cuando estaban abiertos.

SUGERENCIA: Para revertir una operación de importación después de haber cerrado el proyecto, use la opción De fuente(s) en el  cuadro de diálogo Seleccionar Puntos / Ficha general y elimine la selección para deshacer la operación de importación.


Comando Repetir

Utilice este comando para volver a realizar las acciones deshechas utilizando el comando Editar / Deshacer.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Repetir.

  Presione Ctrl+Y.

En el menú Editar, el texto que aparece al lado del comando Repetir muestra la acción a rehacer.

Las acciones pueden repetirse una por vez.

Si cierra el proyecto, no podrá repetir ninguna de las acciones realizadas mientras el primero estaba abierto.


Comando Cortar / Copiar / Pegar

Los comandos Cortar, Copiar y Pegar son una forma conveniente de mover o copiar la selección de datos actual.

Desde el menú Editar, seleccione Cortar, Copiar o Pegar.

  Cortar quita la selección del proyecto actual.

  Copiar hace un duplicado de la selección.

  Pegar inserta la selección en otro proyecto o aplicación de software.

Cuando corte o copie una selección, ésta se guarda en el portapapeles. Cada corte o copia nueva sustituye la que se haya seleccionado con anterioridad.

La copia de la selección se guarda en el portapapeles una vez pegada la selección en un proyecto o en otra aplicación de software. Usted puede pegar la selección de nuevo, o tantas veces como requiera.

Utilice estos comandos para:

  transferir datos entre proyectos (por ejemplo, usted puede copiar los puntos de control entre proyectos)

  copiar y pegar puntos con atributos de un proyecto a otro

  copiar y pegar el trabajo CAD a un informe

  copiar datos en el proyecto con un sistema de coordenadas diferente (por ejemplo, los puntos de un proyecto con el sistema de coordenadas NAD-27 pueden copiarse y pegarse en un proyecto con el sistema de coordenadas NAD-83)

Las entidades copiadas se pegan en el proyecto utilizando los valores de coordenadas asociados a las mismas.  Esto permite que las entidades se coloquen correctamente, ya que si el proyecto en el que va a pegar las entidades tiene una definición de sistema de coordenadas diferente al proyecto de origen de las entidades, los valores de coordenadas se transforman automáticamente en los del nuevo sistema de coordenadas.

NOTA: Para copiar y pegar observaciones desde un proyecto a otro, debe usar el formato Trimble Data Exchange. No se puede copiar y pegar observaciones entre proyectos en Trimble Geomatics Office.


Comando Eliminar

Utilice este comando para eliminar las entidades actualmente seleccionadas.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Eliminar.

  Presione Eliminar.

Para deshacer un comando Eliminar:

  Seleccione Editar / Deshacer.


Comando Renombrar puntos

Utilice este comando para renombrar puntos.

Para acceder al mismo, seleccione Editar / Renombrar puntos.

Aparece el diálogo Renombrar puntos.


Diálogo Renombrar

 Visión de conjunto y más información

Si tiene muchos puntos en un proyecto que no se refieren al mismo punto físico, pero tienen el mismo nombre, usted puede solucionar el problema de los puntos duplicados, renombrándolos con el diálogo Renombrar.

Ejemplo

Se importan dos archivos de Survey Controller capturados por equipos de campo diferentes:

  Un equipo de campo utiliza nombres de punto del 1000 al 2000.

  El otro equipo utiliza nombres de punto del 1000 al 1050.

Cuando se importan los archivos, mientras la opción mezclar puntos duplicados dentro de tolerancia esté activada en el diálogo Opción Puntos Duplicados en la base de datos se crean 51 puntos duplicados (entre el 1000 y el 1050).

Cuando se importan  archivos, mientras esté activada la opción mezclar siempre puntos duplicados en el diálogo Opciones Duplicar Puntos, el software le avisa cuales puntos duplicados ha mezclado. Si desea renombrar los puntos duplicados, deshaga la opción importar y luego renombre los puntos duplicados.

Para ello:

  Seleccione Editar / Renombrar Puntos. Aparecerá el cuadro de diálogo Renombrar puntos.

Renombrar

Para renombrar puntos, seleccione una de las siguientes opciones:

Selección:  Esta opción renombra los puntos seleccionados.

Toda base datos: Esta opción renombra todos los puntos.

Cuando no se haya seleccionado ningún punto, por defecto, se renombran todos los puntos de la base de datos.

SUGERENCIA: Para renombrar coordenadas de un archivo .dc, utilice  el diálogo Seleccionar puntos de la fuente.

Método

El grupo Método tiene las siguientes opciones:

Renombrar desde

Haga clic en Renombrar desde e introduzca el primero de los nombres que quiere sustituir.

Nota: Si se introduce un nombre alfabético, a todos los puntos de la selección se les dará el mismo nombre. Una vez efectuada la selección, para aumentar los nombres de punto introduzca un valor numérico en el último carácter del nombre.

Añadir prefijo

Haga clic en Añadir prefijo e introduzca un prefijo. Por ejemplo, para indicar puntos topográficos, introduzca el prefijo TOPO en el nombre de punto existente seleccionado.

SUGERENCIA: Haga que el último carácter del prefijo sea un espacio. Así se distingue el punto renombrado del original.

Añadir sufijo

Haga clic en Añadir sufijo e introduzca un sufijo. Por ejemplo, añada un sufijo con la fecha a los puntos para indicar la fecha del levantamiento (ej: 08/10/99).

SUGERENCIA: Haga que el primer carácter del sufijo sea un espacio. Así se distingue el punto renombrado del original.

Añadir constante

Utilice esta opción para añadir una constante a los puntos seleccionados. El valor constante puede ser positivo o negativo. Las siguiente tabla proporciona algunos ejemplos:

NOTA: P1023 - 1000 genera P23. Si el resultado deseado es P0023 entonces puede realizarse una segunda operación de renombre P23 + 0000.

Informe

Seleccione esta casilla de verificación para crear un informe de los nombres nuevos así como de los originales. Cuando haga clic en Aceptar, el informe aparece en el visor HTML predeterminado.


Comando Propiedades

Utilice este comando para abrir la ventana Propiedades.

Para acceder a la misma, seleccione Editar / Propiedades.

Se abre la ventana Propiedades.


    Estilos CAD - Visión de conjunto

Más información

Véase también	Diálogo
Visión de conjunto

En la vista del plano, los estilos CAD especifican la visualización de entidades (puntos, líneas, y texto) en la ventana gráfica del software Trimble Geomatics Office.

Los estilos CAD incluyen:

  Estilos de punto

  Estilos de línea

  Estilos de texto

Estilos de punto y estilos de línea

Los estilos de punto y los de línea especifican la visualización de puntos y líneas.

Un estilo de punto está constituido por un símbolo y configuraciones que especifican el tamaño, color, y dimensiones del símbolo. Para crear y editar símbolos de punto, use la utilidad Symbol Editor (Editor de símbolos).

Un estilo de línea está constituido por un tipo de línea y configuraciones que especifican el tamaño, color, y dimensiones del tipo. Para crear y editar tipos de línea, utilice la utilidad Line Type Editor (Editor de tipos de línea).

Para configurar los estilos de punto o de línea, use uno de los siguientes:

  la ventana Propiedades.

  el procesamiento de códigos de característica.

Para crear y editar estilos de punto, utilice el diálogo Estilos CAD de Trimble Geomatics Office, o la utilidad Feature and Attribute Editor (Editor de características y atributos).

Las plantillas predeterminadas de Trimble tienen un estilo de punto y de línea para cada símbolo y tipo de línea del archivo Símbolos (*.sym) y del archivo de tipos de línea (*.ltp). Los estilos tienen el mismo nombre que el símbolo o tipo de línea.

Si un punto o línea tiene los campos Estilo punto o Estilo línea especificados en <Por capa>, el estilo de punto o de línea asignado a los puntos o líneas, se hereda de la capa. Los estilos predeterminados se configuran para la capa que contiene los puntos y líneas.

Para configurar los estilos por defecto para capas diferentes, utilice el diálogo Capas.

Estilos de texto

Los estilos de texto especifican la visualización de entidades de texto en Trimble Geomatics Office. Use la ventana Propiedades para especificar el estilo de texto de estas entidades. El estilo de texto está constituido por la fuente, información de tamaño, y formato de fuente. Trimble suministra un estilo de texto, denominado Estándar, pero usted puede crear el suyo propio. Para ello, utilice el diálogo Estilos CAD de Trimble Geomatics Office.


    Comando Estilos

Utilice este diálogo para crear y administrar estilos de punto, estilos de línea y estilos de texto.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Estilos.

  Presione Ctl+I.

Aparece el diálogo Estilos CAD.


    Diálogo Estilos CAD

 Visión de conjunto y más información

Utilice el diálogo Estilos CAD para crear y administrar estilos de punto, estilos de línea y estilos de texto.

Para acceder al mismo seleccione Editar / Estilos.

Nuevo

Abre el diálogo Crear estilo y crea un nuevo estilo basado en la ficha actual.

Editar

Haga clic en Editar para editar un estilo existente. Si edita un estilo CAD que esté siendo utilizado por una entidad del proyecto, la entidad se actualiza con las configuraciones nuevas del estilo CAD.

Eliminar

Haga clic en Eliminar para eliminar un estilo. Usted puede eliminar todos los estilos CAD que no estén siendo utilizados por una entidad del proyecto.


    Diálogos Crear/Editar estilo de punto

Utilice estos diálogos para crear o editar un estilo de punto

Para acceder a los mismos:

1.	Desde la vista del plano, seleccione Editar / Estilos. Aparece el diálogo Estilos CAD.

2.	En la ficha Estilos de Punto realice uno de los siguientes pasos:

  Haga clic en Nuevo. Aparece el diálogo Crear estilo de punto.

  Haga clic en Editar. Aparece el diálogo Editar estilo de punto.

Una vez que seleccione un estilo, el botón Editar estará disponible.

Nombre

Introduzca el nombre del nuevo estilo de punto o renombre el estilo de punto actual. Todos los nombres de estilo de punto deben ser únicos. Sin embargo, usted puede utilizar el mismo nombre para el estilo de punto, el de línea y el de texto.

Símbolo

Seleccione un símbolo de la lista de símbolos. Para ver y editar el símbolo, use la utilidad Symbols Editor.

Color

Seleccione un color para el símbolo. Si selecciona texto de la ventana, el estilo se visualizará utilizando la configuración de texto de ventana en Microsoft Windows. Para editar la configuración de texto de ventana, use el Panel de control. Si se utiliza el texto de la ventana y si ha seleccionado el estilo de leyenda, cuando dibuje algo se usará el estilo predeterminado negro. Para seleccionar este estilo, elija la ficha Vista / Opciones/ Leyenda topográfica. Si ya ha seleccionado el estilo de leyenda negro, el estilo por defecto que se utiliza al dibujar será el blanco.

Algunas definiciones de símbolo tienen colores definidos. Estos colores se especifican cuando se crea el símbolo en la utilidad Symbol Editor. Por ejemplo, si se utiliza este editor, puede definirse que el color para el símbolo ‘arbusto’ sea verde. Cuando se seleccionen símbolos que tengan definiciones de color, el campo Color no estará disponible, y visualizará ‘Del símbolo’.

Diámetro

Introduzca el diámetro para el símbolo. Las unidades del campo Diámetro cambian en función de la configuración de la opción Dimensiones: Papel o Terreno. En el caso de algunos símbolos no relacionados con diámetros (por ejemplo un punto de pixel único), este campo no está disponible.

Papel	Con la opción Papel seleccionada, el valor del diámetro del símbolo controla el tamaño del símbolo en papel.

Por ejemplo, si la opción Dimensiones se ha configurado en Papel y usted introduce 5 en el campo Diámetro, Trimble Geomatics Office traza un símbolo de cinco milímetros en un dibujo métrico.

Las unidades que utiliza Trimble Geomatics Office son las de Coordenadas. Para especificarlas, seleccione Archivo / Propiedades proyecto / ficha Unidades y formato.

La representación de las unidades de papel en pantalla se calcula utilizando la escala del dibujo. Para configurar esta escala, seleccione el diálogo Archivo / Configuración hoja.

Terreno	Con la opción Terreno seleccionada, el valor del diámetro del símbolo es el tamaño del terreno.

Por ejemplo, si la opción Dimensiones se ha configurado en Terreno y usted introduce 5 en el campo Diámetro, Trimble Geomatics Office traza un símbolo de cinco metros (o de cinco pies), dependiendo de la configuración especificada en Unidades de coordenadas. Esto se produce tanto en el dibujo como en pantalla.

Para especificar las unidades, seleccione Archivo / Propiedades proyecto / ficha Unidades y formato.

Rotación

Utilice este campo para controlar la orientación del símbolo. La interpretación de este campo depende de la configuración de la opción Dimensiones.

Papel	Con la opción Papel seleccionada, el símbolo siempre se dibuja orientado en relación a la parte superior de la página en que se va a trazar.

Terreno	Con la opción Terreno seleccionada, el símbolo se dibuja relativo al Norte.

Dimensiones

Haga clic en Papel o en Terreno para controlar el funcionamiento de los campos Diámetro y Rotación, tal y como se ha descrito anteriormente.


    Diálogos Crear/Editar estilo de línea

Utilice estos diálogos para crear o editar un estilo de línea.

Para acceder a los mismos:

1.	Desde la vista del plano seleccione Editar / Estilos. 	Aparece el diálogo Estilos CAD.

2.	Realice uno de los siguientes pasos:

  Haga clic en Nuevo. Aparece el diálogo Crear estilo de línea.

  Haga clic en Editar. Aparece el diálogo Editar estilo de línea.

Una vez que seleccione un estilo, el botón Editar está disponible.

Nombre

Introduzca el nombre del nuevo estilo de línea o renombre el estilo de línea actual. Todos los nombres de estilo de línea deben ser únicos. Sin embargo, usted puede utilizar el mismo nombre para el estilo de punto, el de línea y el de texto.

Configuraciones

Utilice este grupo para definir la apariencia del estilo.

Tipo de línea

Seleccione el tipo de línea para la línea. Para ver o editar un tipo de línea, use la utilidad Trimble Line Types Editor.

Color

Seleccione un color para el tipo de línea. Si selecciona texto de la ventana, el estilo se visualizará utilizando la especificación del texto de ventana de Microsoft Windows. Para editar la configuración de Windows, use el Panel de control. Si se utiliza el texto de la ventana y si ha seleccionado el estilo de leyenda, cuando dibuje algo se usará el estilo predeterminado negro. Para seleccionar este estilo, elija Archivo / Propiedades proyecto / Ficha  Leyenda topográfica. Si ya ha seleccionado el estilo de leyenda negro, el estilo por defecto que se utiliza al dibujar será el blanco.

Algunas definiciones de tipos de línea tienen colores definidos. Estos colores se especifican cuando se crea el tipo de línea en la utilidad Line Type Editor. Por ejemplo, si se utiliza este editor, puede definirse que el color para el tipo de línea ‘arbusto’ sea verde. Cuando se seleccionen tipos de línea que tengan definiciones de color, el campo Color no estará disponible, y visualizará ‘Del tipo de línea’.

Longitud

Introduzca la longitud de la repetición del patrón. Este campo estará disponible cuando el tipo de línea es un patrón que se repite cuando se selecciona el estilo para una línea. Por ejemplo, usted puede seleccionar una ‘línea de valla’ como el tipo a repetir. Esto se ilustra en la siguiente figura:

Algunos tipos de línea tienen una longitud inherente (por ejemplo, puerta); por lo que este campo no está disponible.

La interpretación de este campo depende de la configuración de la opción Dimensiones. Las unidades para el campo Longitud cambian en función de la especificación de Dimensiones: Papel o Terreno.

Papel	Con la opción Papel seleccionada, el valor de la longitud se especifica en milímetros (mm) o en pulgadas (pgs). (Las unidades dependen de la configuración de las unidades de coordenadas. Para especificar estas unidades, seleccione Archivo / Propiedades proyecto/ ficha Unidades y formato.)

Por ejemplo, si la opción Dimensiones se ha configurado en Papel y usted introduce 5 en el campo Longitud, el software Trimble Geomatics Office traza una línea con un patrón de cinco milímetros (o cinco pulgadas).

La representación de las unidades de papel en pantalla se calcula utilizando la escala del dibujo. Para configurar esta escala, seleccione Archivo / Configuración hoja.

Terreno	Con la opción Terreno seleccionada, el valor de la longitud es el valor del campo especificado para las unidades de coordenadas. Para especificar las unidades, seleccione Archivo / Propiedades proyecto / ficha Unidades y formato.

Por ejemplo, si la opción Dimensiones se ha configurado en Terreno y usted introduce 5 en el campo Longitud, el software Trimble Geomatics Office traza una línea de cinco metros (o de cinco pies). Esto se produce tanto en el dibujo como en pantalla.

Anchura	Introduzca el ancho de la línea. Para algunos tipos de línea (como las líneas continuas), el ancho no es pertinente por lo que este campo no está disponible. La siguiente figura muestra cómo se aplica este campo:

La interpretación de este campo depende de la configuración de las dimensiones:

Papel	Si se selecciona la opción Papel, el tipo de línea se especifica en milímetros o en pulgadas. (Las unidades dependen de la configuración de las unidades de coordenadas. Para especificar estas unidades, seleccione Archivo / Propiedades proyecto/ Ficha Unidades y formato.)

Terreno	Si se selecciona la opción Terreno, el valor del tipo de línea será el de los valores del terreno especificados para las unidades de coordenadas de Archivo / Propiedades proyecto/ Unidades y formato.

Dimensiones

Haga clic en Papel o en Terreno para controlar el funcionamiento de los campos Longitud y Anchura tal y como se ha descrito anteriormente.


    Diálogos Crear/Editar estilo de texto

Utilice el diálogo Crear/Editar estilo de texto para crear o editar un estilo de texto.

Para acceder a los mismos:

1.	Desde la vista del plano, seleccione Editar / Estilos. Aparecerá el diálogo Estilos CAD.

2.	Seleccione la ficha Estilos de Texto.

3.	Realice uno de los siguientes pasos:

  Haga clic en Nuevo. Aparece el diálogo Crear estilo de texto.

  Haga clic en Editar. Aparece el diálogo Editar estilo de texto.

(El botón Editar se activa una vez que haya seleccionado un estilo.)

Nombre

Introduzca el nombre del nuevo estilo de texto o renombre el nombre actual del estilo de texto.Todos los nombres de estilo de línea deben ser únicos. Sin embargo, usted puede utilizar el mismo nombre para el estilo de punto, el de línea y el de texto.

Fuente

Seleccione la fuente para el estilo de texto.

Los nombres de fuente visualizados en la lista son los disponibles en Microsoft Windows.

Color

Seleccione el color del texto. Si no selecciona un color, el valor por defecto es la configuración de texto de ventana de Microsoft Windows. Para editar la configuración de texto de ventana, use el Panel de control. Si se utiliza el texto de la ventana y si ha seleccionado el estilo de leyenda, cuando dibuje algo se usará el estilo predeterminado negro. Para seleccionar este estilo, elija Vista/ Opciones/ ficha Leyenda topográfica.  Si ya ha seleccionado el estilo de leyenda negro, el estilo por defecto que se utilice en pantalla será el blanco.

Altura

Introduzca la altura para el estilo de texto.

La interpretación de este campo depende de la configuración de las dimensiones:

Papel	Si se selecciona la opción Papel, el valor de la altura se especifica en milímetros (mm) o en pulgadas (pgs). (Las unidades dependen de la configuración de las unidades de coordenadas especificadas en Archivo / Propiedades proyecto/ ficha Unidades y formato.)

Por ejemplo, si la opción se ha configurado en Papel y se introduce 5 en el campo Altura, el texto de un dibujo métrico tendrá cinco milímetros de altura. La representación de las unidades de papel en pantalla se calcula utilizando la escala del dibujo. Para configurar esta escala, seleccione el diálogo Archivo / Configuración hoja.

Terreno	Con la opción Terreno seleccionada, el valor de la altura es el de los valores configurados para las unidades de coordenadas en Archivo / Propiedades proyecto / ficha Unidades y formato.

Por ejemplo, si la opción se ha configurado en Terreno y se introduce 5 en el campo Altura, el texto de un dibujo métrico tendrá una altura de cinco metros tanto en el dibujo como en pantalla.

Estilo fuente

Seleccione las casillas de verificación negrita, cursiva, o subrayado para crear el estilo de texto deseado.

Dimensiones

Haga clic en Papel o en Terreno para controlar el funcionamiento del campo Altura tal y como se ha descrito anteriormente.


    Comando Capas

Utilice este comando para administrar las capas del proyecto actual.

Para acceder al mismo:

 Seleccione Editar / Capas.

Aparece el diálogo Capas.


    Diálogo Capas

 Visión de conjunto y más información

Utilice este diálogo para administrar las capas del proyecto actual.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Capas.

  Haga clic en la herramienta Capas [image].

  Presione Ctrl+C.

La capa actual se muestra en la parte superior del diálogo.

Nombre

Introduzca un nombre para la capa. Este nombre debe ser único. Si se cambia el nombre de una capa que contenga entidades, éstas se moverán a la capa siguiente.

Estilo punto

Seleccione un estilo de punto de la lista. Las entradas de la lista son los estilos predefinidos por Trimble, así como los nuevos estilos de punto que usted ha creado en Trimble Geomatics Office (utilizando Editar / Estilos), o durante el procesamiento de códigos de característica. (Para obtener más información, véase la ayuda de la utilidad Feature and Attribute Editor.)

El estilo de punto es el utilizado para todos los puntos de la capa para los que se haya seleccionado el estilo de punto <Por capa>.

Estilo línea

Seleccione un estilo de línea de la lista. Las entradas de la lista son los estilos predefinidos por Trimble así como los nuevos estilos de línea que usted ha creado en Trimble Geomatics Office (utilizando Editar / Estilos), o durante el procesamiento de códigos de característica. (Para obtener más información, véase la ayuda de la utilidad Feature and Attribute Editor.)

El estilo de línea es el utilizado para todas las líneas de la capa para las que se haya seleccionado el estilo de línea <Por capa>.

Estilo texto

Seleccione un estilo de texto de la lista. Las entradas de la lista son los estilos predefinidos por Trimble así como los nuevos estilos de texto que usted ha creado en Trimble Geomatics Office (utilizando Editar / Estilos).

Este estilo de texto es el utilizado para todos los textos y anotaciones de esta capa cuyo estilo de texto seleccionado sea <Por capa>.

Bloqueado

Para poder seleccionar entidades de capa en la ventana gráfica de Trimble Geomatics Office, inhabilite esta casilla de verificación. Si no quiere que se seleccionen las entidades de esta capa, seleccione esta casilla. El valor del campo se muestra en la herramienta Selección de capas de la barra de herramientas Capas.

Si la capa está bloqueada, en la barra de herramientas Capas se muestra el icono [image].

Si la capa no está bloqueada, en la barra de herramientas Capas se muestra el icono [image].

Si se ha habilitado el campo Bloqueado para una o varias capas, en la barra de estado se muestra el icono [image].

NOTA: Si selecciona esta casilla de verificación, usted no podrá ver las entidades de la capa con ninguno de los siguientes métodos:

  utilizando la ventana Propiedades

  seleccionando entidades haciendo clic en las mismas

 utilizando cualquiera de los comandos de selección del menú Seleccionar

Visible

Para ver entidades de capa en la ventana gráfica, seleccione esta casilla de verificación. El valor de este campo se muestra en la herramienta Selección de capas de la barra de herramientas Capas. Si la capa está visible, en la barra de herramientas Capas se muestra el icono [image].

Si la capa no está visible, en la barra de herramientas Capas se muestra el icono [image].

Para ocultar las entidades de una capa, inhabilite esta casilla de verificación.

NOTA: Si inhabilita esta casilla de verificación, no podrá ver las entidades de la capa en la ventana gráfica del software Trimble Geomatics Office.

El icono Capas Ocultas [image] aparece en la barra de estado cuando una o más  capas están ocultas. Es decir, el icono se muestra en la barra de estado cuando la propiedad Visible de una o varias capas está inhabilitada.

PRECAUCION: Si la capa no está visible, no se podrán ver ni seleccionar entidades de la misma. Esto se aplica tanto para la capas bloqueadas como para capas no bloqueadas.  Esto significa que la opción Visible se impone sobre la opción Bloqueado.

Nuevo

Haga clic en Nuevo para añadir una capa nueva al proyecto. En el diálogo Capa se agrega una fila nueva. Introduzca los valores para todas las columnas de la nueva capa.

Eliminar

Haga clic en Eliminar para eliminar la capa actualmente resaltada. Si elimina una capa que contenga entidades, se mostrará un diálogo de aviso que indica que si se elimina la capa, también se eliminarán todas las entidades de la misma.

Actual

Haga clic en Actual para hacer que la capa seleccionada se convierta en la capa actual. Esta última se resalta. La capa actual es la capa a la que se añaden las entidades nuevas. Todas las entidades (puntos, líneas, arcos, curvas, texto, y anotaciones) agregadas a la base de datos sin un nombre de capa se añaden a la capa actual.

SUGERENCIA: Usted puede editar entradas múltiples en el diálogo Capas:

1.	Utilice la tecla Ctrl para seleccionar entradas múltiples.

2.	Edite el último campo resaltado. Todas las entradas resaltadas serán actualizadas.


    Capas - Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de Conjunto

En la vista en Planta, cada entidad del proyecto pertenece a una capa. Cada capa consiste en un nombre, estilo de puntos, estilo de líneas, y estilo de texto. El organizar los datos en capas facilita el manejo de la información. Esto es útil cuando se trabaja con un gran conjunto de datos. Por ejemplo, todos los puntos con el código de característica ‘árbol’ pueden ser agrupados en una capa llamada ‘Arboles’. A menos que haya creado nuevas capas en el proyecto, se usa la capa Por defecto  para todas las entidades.

Todas las entidades (puntos, líneas, arcos, curvas, texto, y anotaciones) tienen un campo de Capas. Utilice la ventana de Propiedades para ver las entidades. Para seleccionar la capa para una entidad, utilice uno de los siguientes métodos:

  Cuando agregue una entidad al proyecto, seleccione la capa del campo Capas en el diálogo apropiado.

  Importe un archivo con la capa especificada.

  Utilice el procesamiento del código de característica.

  Para seleccionar la capa para entidades existentes en el proyecto, utilice la ventana de Propiedades.

Para administrar las capas para el proyecto, utilice el diálogo de Capas.

Utilice la barra de herramientas de Selección de Capas para especificar que capas puede ver y seleccionar. Para seleccionar entidades en una capa seleccionada:

  Escoja Seleccionar / Por Capa.

Si un punto en la base de datos tiene la opción <Por Capa> seleccionada en el campo de estilo de Punto, se asigna al punto el estilo de Punto especificado para la capa. Si una línea, curva, o arco tiene la opción <Por Capa> seleccionada en el campo de estilo de línea, entonces se asigna el estilo de línea especificado para la capa a la línea, curva, o arco.

De igual manera, si una anotación de texto tiene la opción <Por Capa> seleccionada en el campo de estilo de Texto, entonces el estilo de texto especificado para la capa se asignará al texto o anotación.


Puntos duplicados - Visión de conjunto

Más información

Cómo ...	Diálogo
Visión de Conjunto

Trimble Geomatics Office brinda dos opciones para importar puntos con el mismo nombre:

1. 	Siempre mezcle puntos duplicados.

2.	Mezcle puntos duplicados dentro de tolerancia. Usted puede especificar la tolerancia horizontal o vertical dentro de la cual el software debe mezclar puntos o el software no resuelva puntos duplicados al ser importados.

Por defecto, Trimble Geomatics Office mezcla puntos con el mismo nombre al ser importados de modo que no se crean puntos duplicados. (Esta es la manera más rápida para importar datos.)

Si usted decide no mezclar puntos duplicados , los puntos serán creados cuando usted importe uno o más archivos que tiene observaciones o coordenadas que estén fuera de la tolerancia para el mismo punto. Por ejemplo , cuando usted importa:

  un archivo que contiene un punto con el mismo nombre que un punto existente en la base de datos y no están dentro de la tolerancia.

  puntos con el mismo nombre de archivos diferentes de Survey Controller (*.dc)

Si es necesario, usted también puede mezclar puntos dentro del mismo software, utilizando el comando Mezclar Puntos Duplicados.

Cómo Trimble Geomatics Office mezcla puntos

Un punto sólo puede tener una coordenada WGS-84 introducida por un usuario y también sólo una coordenada grilla/local introducida por un usuario. Trimble Geomatics Office escoge cúal de las coordenadas existentes WGS-84 o grilla/local sobrescribir siguiendo las siguientes reglas:

1.	Se toman las coordenadas de más alta calidad.

2.	Se utiliza el último componente de la coordenada introducido en la base de datos.

El Informe de derivación de puntos brinda detalles de los datos topográficos utilizados para coordinar los puntos, mientras que el Informe para importar lista todos los componentes de las coordenadas que han sido sobrescritos o descartados.

NOTA: Si el software sobrescribe una coordenada que usted quiere usar, usted debe deshacer la operación importar, editar el archivo importar (o el nombre del punto en el proyecto Trimble Geomatics Office), y  volver a importar los datos. Alternativamente, deshaga la operación importar y vuelva a importar los datos utilizando la opción Mezclar Puntos Duplicados dentro de Tolerancia en el diálogo Opciones Duplicar Punto. Luego usted puede  renombrar los puntos duplicados desde Trimble Geomatics Office.


Diálogo Opciones puntos duplicados

Mas Información

Cómo ...	Véase también

Utilice el diálogo Opciones puntos duplicados para especificar cómo Trimble Geomatics Office maneja puntos con el mismo nombre cuando son importados a un proyecto.

Las configuraciones en este diálogo aplican a todas las opciones importar; Sea que usted importe archivos utilizando la barra  de proyectos o arrastre y bote archivos en un proyecto Trimble Geomatics Office, el software utiliza la última configuración que usted especificó en las Opciones Duplicar Punto. Usted puede crear una plantilla para configurar las Opciones Duplicar Puntos.

Para acceder al diálogo Opciones puntos duplicados:

1.	Seleccione Archivo / Importar. Aparecerá el cuadro de diálogo Importar .

2.	Haga clic en Opciones.

La siguiente sección describe las opciones disponibles:

Mezclar siempre los puntos duplicados

Esta opción es seleccionada por defecto. El software mezcla puntos con el mismo nombre al ser importados, de este modo no se crean puntos duplicados. Después de importar, el informe  Importar lista cualquier componente de coordenadas que ha sobrescrito o descartado.

NOTA: Si el software sobrescribe una coordenada que usted quiere usar, usted debe deshacer la operación importar, editar el archivo importar (o el nombre del punto en el proyecto Trimble Geomatics Office), y  volver a importar los datos. Alternativamente, deshaga la operación importar y vuelva a importar los datos utilizando la opción Mezclar Puntos Duplicados dentro de Tolerancia en el diálogo Opciones Duplicar Punto. Luego usted puede  renombrar los puntos duplicados desde Trimble Geomatics Office.

Mezclar puntos duplicados dentro de tolerancia

Si usted selecciona esta opción, todos los datos de levantamiento topográfico para un punto son colocados bajo el mismo punto si está dentro de la tolerancia horizontal y/o vertical que usted especifica. La tolerancia por defecto está determinada por las tolerancias horizontal y vertical desconocidas, especificadas en la ficha Recalcular del diálogo Propiedades proyecto. Después de importar, el Informe para importar lista cualquier coordenada sobrescrita o descartada.

También puede utilizar esta opción para especificar que el software no mezcla puntos duplicados al ser importados. Para hacer esto, configure la tolerancia para importar datos en 0.02 (es decir, la tolerancia de calidad topográfica horizontal) y 0.050 (es decir, la tolerancia de calidad topográfica vertical). Luego, sólo tiene que renombrar los puntos duplicados desde Trimble Geomatics Office. Si se especifican ambas tolerancias, la horizontal y la vertical, para que se mezclen los puntos duplicados, éstos deben estar dentro de ambas tolerancias. Si no se especifica una tolerancia (es decir, en el grupo Tolerancias, las casillas de verificación Horizontal y Vertical no están seleccionadas) se mezclarán los puntos duplicados.

NOTA: Al importar datos de un nivel digital, sólo se usa la tolerancia vertical.

NOTA: Si la tolerancia se configura en 0.000, las coordenadas de puntos duplicados deben ser exactamente las mismas para que los puntos se mezclen.


Comando Separar puntos

Utilice este comando para crear muchos puntos a partir de un sólo punto a través de la separación de los datos:

  según su origen.

  según todas las observaciones

  según tipo de datos (GPS/Terrestre)

Para acceder al mismo, seleccione Editar / Separar puntos.

Aparece el diálogo Separar puntos.

Utilice la opción separar puntos para:

  resolver puntos duplicados

  computar posiciones para cada observación

  efectuar una calibración en Trimble Geomatics Office cuando los datos GPS y los datos cuadrícula/local están bajo el mismo punto.

  separar observaciones terrestres y de GPS


Diálogo Separar puntos

Un punto puede tener datos topográficos que procedan de varias fuentes de datos. Asimismo la fuente de datos puede contener más de una observación. Sin embargo, sólo se utiliza una observación para derivar la posición calculada del punto.

Usted puede utilizar la opción Separar puntos para crear puntos separando datos por fuente de datos, todas las observaciones, o tipo de datos (GPS/Terrestre). Separe puntos para:

  resolver puntos duplicados

  calcular posiciones para cada observación

  realizar una calibración local GPS en Trimble Geomatics Office cuando los datos GPS y los datos GPS locales/de cuadrícula están bajo el mismo punto

  separar observaciones terrestres y observaciones GPS

Cuando separe puntos, la operación crea puntos con el mismo nombre.

Por ejemplo si se importan dos archivos de Survey Controller (*.dc) al proyecto:

  El primer archivo .dc contiene una observación convencional del punto ‘101’.

  El segundo archivo .dc contiene una coordenada tecleada y una observación GPS del punto ‘101’.

Cuando se importa el primer archivo, en el proyecto se crea un único punto ‘101’ y la observación se utiliza para derivar la posición del punto. Cuando se importa el segundo archivo, el software Trimble Geomatics Office compara la coordenada tecleada del archivo .dc con la posición del punto del proyecto. Ya que los datos del levantamiento del archivo .dc se refieren al mismo punto ‘101’; el punto del proyecto y el punto del archivo .dc se mezclan automáticamente para formar un solo punto. Los datos del levantamiento proceden de dos fuentes: el primer y segundo archivo de Survey Controller (*.dc). Por lo que habrá tres grupos de orígenes de coordenadas para un punto:

  Observación convencional

  Coordenada tecleada.

  Ocupación GPS

SUGERENCIA: Usted puede ver la fuente de datos, la observación y el contenido de la observación de un punto en el menú de la ventana Propiedades.

Sólo puede separar puntos cuando hay un punto en el actual conjunto de selección que contiene observaciones o coordenadas múltiples.

Para acceder al diálogo Separar puntos, seleccione Editar / Separar puntos.

Separar

Para separar puntos a fin de crear puntos separados, el software separa los datos usando uno de los siguientes métodos:

Según fuente de datos	Por ejemplo, un archivo a .dc
Según todas las observaciones	Se crean puntos separados de todas las observaciones y coordenadas para el punto.
Según tipo de datos	Todas las observaciones GPS y coordenadas WGS-84 se colocan bajo un mismo punto. Todas las coordenadas de cuadrícula y observaciones terrestres se colocan bajo otro punto.
NOTA: Si necesita llevar a cabo una calibración local GPS en Trimble Geomatics Office, y las observaciones GPS y coordenadas de cuadrícula están bajo el mismo punto, use la opción Separar puntos por tipo de datos. Esta operación crea dos puntos; un punto de cuadrícula y un punto GPS. A partir de ese momento podrá ejecutar una calibración local GPS usando estos puntos.

Renombrar Puntos GPS con sufijo (_GPS)

Si usted selecciona la opción Según Datos, se vuelve disponible la opción   Renombrar Puntos GPS con sufijo.  Usted puede hacer distinguir los nombres de puntos seleccionando el sufijo a añadir a los puntos GPS. Si usted no selecciona esta opción, los puntos serán separados según tipo de datos y cada punto tendrá el mismo nombre.

Mostrar separación estadísticas

Seleccione esta casilla de verificación para visualizar el número de puntos que pueden crearse a partir de puntos seleccionados utilizando el método de separación selecci


Comando Edición múltiple

Véase también

Utilice este comando para editar las propiedades relacionadas con el levantamiento o relacionadas con CAD de las entidades de la selección. Este comando sólo está disponible si usted tiene activada una selección actual.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Edición múltiple.

  Elija Edición múltiple del menú de acceso directo.

Aparece el diálogo Edición múltiple (ficha Levantamiento o ficha CAD).


Diálogo Edición múltiple - Ficha Levantamiento

Utilice este diálogo para editar las propiedades relacionadas con el levantamiento en entidades múltiples. Por ejemplo, usted puede corregir las alturas de antena de las ocupaciones de un grupo de puntos GPS, si sabe que no se introdujeron correctamente en el campo.

Para tener acceso al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Edición múltiple.

  Elija Edición múltiple del menú de acceso directo.

NOTA: La selección es validada cuando es seleccionada. Se vuelve no disponible si no es una opción válida para la selección actual.

Efectuar estas ediciones en los puntos seleccionados

Este grupo contiene las propiedades relacionadas con el levantamiento para editar los puntos seleccionados.

Configurar altura de antena en

Seleccione esta casilla de verificación para habilitar los campos mostrados a continuación. Utilícelos para cambiar las alturas de antena de las ocupaciones del punto.

Cambiar alturas de tamaño	Seleccione el valor de altura de antena de los puntos que quiere cambiar. La lista contiene las alturas introducidas para los puntos seleccionados. Sólo se cambiarán las alturas de antena con el valor seleccionado.
Nueva altura de antena	Introduzca el valor de altura de antena correcta que quiere aplicar

Configurar detalles antena GPS en

Seleccione esta casilla de verificación para habilitar los siguientes campos. Utilícelos para cambiar el tipo de antena y/o el método de medición de los puntos seleccionados.

Tipo antena	Seleccione el tipo de antena para los puntos que quiere cambiar.
Medido a	Seleccione el método de medición para los puntos que quiere cambiar. La lista de este campo depende del tipo de antena seleccionado. Si se selecciona un tipo nuevo, el campo se inhabilita.

Configurar detalles destino convencional en

Seleccione esta casilla de verificación para habilitar los campos que se muestran a continuación. Utilícelos para cambiar las alturas de destino y constantes de prisma de los puntos seleccionados.

Altura destino	Introduzca la altura correcta que quiere aplicar.
Constante prisma	Introduzca la constante de prisma correcta que quiere aplicar.

Configurar altura blanco láser

Seleccione esta casilla de verificación para habilitar este campo. Introduzca la altura de destino correcta que quiere aplicar.

Efectuar estas ediciones a las observaciones seleccionadas

Este grupo contiene las propiedades relacionadas con el levantamiento para editar las observaciones seleccionadas (GPS, Convencional, Láser).

Usar en ajuste de la red

Seleccione esta casilla de verificación para habilitar el campo. Use este campo para utilizar (o excluir) las observaciones seleccionadas en un ajuste de red (si tiene instalado el módulo de Ajuste de red).

Esta configuración sólo se aplica a las observaciones GPS que tienen información de covarianza (QC2). Cuando la lista se configura en No, las observaciones de un ajuste de red estarán inhabilitadas. Sin embargo, éstas se siguen utilizando durante el recálculo con el fin de determinar las posiciones de los puntos.

Confg estado observación en

Seleccione esta casilla de verificación para habilitar el campo. Use este campo para habilitar o inhabilitar una observación durante un recálculo o para habilitar las observaciones como una comprobación.

Cuando las observaciones no están habilitadas, éstas no se utilizarán en un recálculo; y se generará un informe con los errores de cierre de las observaciones. Si habilita las observaciones como una comprobación, éstas se utilizarán para dar coordenadas a un punto si no hay disponible ninguna coordenada ni observación habilitada.

Suprimir indicador de tipo

Seleccione esta casilla de verificación para habilitar el campo. Seleccione los tipos de indicador de aviso que quiere suprimir en la vista del levantamiento. Los indicadores de aviso volverán a mostrarse si se realiza un recálculo.

NOTA: Cuando seleccione una casilla de verificación para editar un campo particular, Trimble Geomatics Office comprueba las entidades seleccionadas. Si descubre que los campos no son pertinentes a las entidades seleccionadas, la(s) opción(es) de la casilla de verificación se inhabilita(n).


Diálogo Edición múltiple - Ficha CAD

Utilice este diálogo para editar las propiedades relacionadas con CAD de las entidades de la selección.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Edición múltiple.

  En el menú de acceso directo, elija Edición múltiple.

Efectuar estas ediciones en los puntos seleccionados

Este grupo contiene las propiedades relacionadas con CAD para editar los puntos seleccionados.

Configurar código caract. en

Seleccione esta casilla de verificación para habilitar el campo. Introduzca el valor de código de característica que quiere aplicar a los puntos seleccionados.

Configurar capa en

Seleccione esta casilla de verificación para habilitar el campo. Seleccione la capa que quiere asignar a los puntos seleccionados. Si se introduce una capa que no existe, aparece el diálogo Capa nueva .

Configurar estilo punto en

Seleccione esta casilla de verificación para habilitar el campo. Seleccione el estilo de punto que quiere aplicar a los puntos seleccionados. Si se introduce un estilo de punto que no existe, aparece el diálogo Crear estilo de punto.

Quitar todas las anotaciones

Seleccione esta casilla de verificación para quitar todas las anotaciones asignadas a los puntos seleccionados.

Efectuar estas ediciones a la línea seleccionada

Este grupo contiene las propiedades relacionadas con CAD para editar las líneas seleccionadas (líneas, curvas, arcos).

Configurar capa en

Seleccione esta casilla de verificación para habilitar el campo. Seleccione la capa que quiere asignar a la línea seleccionada. Si se introduce una capa que no existe, aparece el diálogo Capa nueva.

Configurar estilo línea en

Seleccione esta casilla de verificación para habilitar el campo. Seleccione el estilo de línea que quiere aplicar a las líneas seleccionadas. Si se introduce un estilo de línea que no existe, aparece el diálogo Crear estilo de línea.

Quitar todas las anotaciones

Seleccione esta casilla de verificación para quitar todas las anotaciones asignadas a las líneas seleccionadas.

Efectuar estas ediciones al texto seleccionado

Este grupo contiene los campos para editar el texto seleccionado.

Configurar capa en

Seleccione esta casilla de verificación para habilitar el campo. Seleccione o cree una capa nueva que quiera asignar al texto seleccionado. Seleccione la capa que quiere asignar al texto seleccionado. Si se introduce una capa que no existe, aparece el diálogo Capa nueva.

Configurar estilo texto en

Seleccione esta casilla de verificación para habilitar el campo. Seleccione el estilo de texto que quiere aplicar al texto seleccionado. Si se introduce un estilo de texto que no existe, aparece el diálogo Crear estilo de texto.


    Comando Habilitar/Inhabilitar observaciones

Utilice este comando para habilitar o inhabilitar una observación. Si se inhabilita una observación, ésta se quita para que no pueda utilizarse en ningún cálculo topográfico.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Editar / Habilitar/Inhabilitar observaciones.

  En la ventana Propiedades, utilice el campo Estado de una observación.

  En el diálogo Edición múltiple / ficha Levantamiento, utilice el campo Confg estado observación en.

NOTA: Un recálculo considera el estado de las observaciones para determinar la posición calculada de un punto. Usted puede utilizar la función Habilitar/Inhabilitar observaciones para inhabilitar el estado de una observación con el fin de que ésta se quite de un recálculo.

Sólo se puede cambiar el estado de las observaciones cuando:

  Hay una selección activada y

  todas las observaciones en el conjunto de selección tienen el mismo estado de observación.

NOTA: Se puede configurar el estado de las observaciones múltiples si tiene mas de uno en su conjunto de selección actual.

Cuando se inhabilite una observación, el color de las líneas de la observación cambia a rojo oscuro.

NOTA: Si hay observaciones múltiples en la misma línea, se muestra la observación sólo en rojo si todas las observaciones están inhabilitadas.


    Comando Flujo de Salida de Observación Invertido

Los vectores se aplican en el sentido en el que se observan. Utilice este comando para invertir el sentido de una observación, y  obligar a que se aplique en sentido contrario.

Para acceder al mismo, seleccione Editar / Flujo de Salida de Observación Inversa

Cuando se invierta el sentido de la observación, es probable que cambien la calidad y las coordenadas calculadas del punto. El proceso de recálculo debe utilizarse para aplicar la observación y calcular las posiciones de punto nuevas.

PRECAUCION: Si el punto desde el que quiere que fluya la observación no tiene una posición conocida (p.ej: un punto RTK observado), no se aplicará la observación.


Diálogo Nueva capa

Utilice este diálogo para crear una capa nueva. Este diálogo aparece si se introduce un nombre de capa que no existe cuando se insertan o editan entidades (puntos, líneas, curvas, arcos, texto).

Nombre

Introduzca un nombre para la capa a la que va a moverse la(s) entidad(es) seleccionada(s).

Estilo punto

Seleccione un estilo de punto de la lista. Las entradas de la lista son los estilos predefinidos por Trimble así como los nuevos estilos de punto que usted ha creado en Trimble Geomatics Office (utilizando Editar / Estilos), o durante el procesamiento de códigos de característica.

Para obtener más información, véase la ayuda de la utilidad Feature and Attribute Editor.

El estilo de punto es el utilizado para todos los puntos de la capa para los que se haya seleccionado el estilo de punto <Por capa>.

Estilo línea

Seleccione un estilo de línea de la lista. Las entradas de la lista son los estilos predefinidos por Trimble así como los nuevos estilos de línea que usted ha creado en Trimble Geomatics Office (utilizando Editar / Estilos), o durante el procesamiento de códigos de característica.

El estilo de línea es el utilizado para todas las líneas de la capa para las que se haya seleccionado el estilo de línea <Por capa>.

Estilo texto

Seleccione un estilo de texto de la lista. Las entradas de la lista son los estilos predefinidos por Trimble así como los nuevos estilos de texto que usted ha creado en Trimble Geomatics Office (utilizando Editar / Estilos).

Este estilo de texto es el utilizado para todos los textos y anotaciones de esta capa cuyo estilo de texto seleccionado sea <Por capa>.

Bloqueado

Para poder seleccionar entidades de capa en la ventana gráfica de Trimble Geomatics Office, inhabilite esta casilla de verificación. Si no quiere que se seleccionen las entidades de esta capa, seleccione esta casilla. El valor del campo se muestra en la herramienta Selección de capas de la barra de herramientas Capas.

Si la capa está bloqueada, en la barra de herramientas Capas se muestra el icono [image].

Si la capa no está bloqueada, en la barra de herramientas Capas se muestra el icono [image].

Si se ha habilitado el campo Bloqueado para una o varias capas, en la barra de estado se muestra el icono [image].

NOTA: Si selecciona esta casilla de verificación, usted no podrá ver las entidades de la capa por ninguno de los siguientes métodos:

  utilizando la ventana Propiedades.

  seleccionado las entidades haciendo clic en las mismas.

  utilizando cualquiera de los comandos de selección del menú Seleccionar.

Visible

Para ver entidades de capa en la ventana gráfica, seleccione esta casilla de verificación. El valor de este campo se muestra en la herramienta Selección de capas de la barra de herramientas Capas.

Si la capa está visible, en la barra de herramientas Capas se muestra el icono [image].

Si la capa no está visible, en la barra de herramientas Capas se muestra el icono [image].

Para ocultar las entidades de una capa, inhabilite esta casilla de verificación.

NOTA: Si inhabilita esta casilla de verificación, no podrá ver las entidades de la capa en la ventana gráfica del software Trimble Geomatics Office.

El icono Visible [image] aparece en la barra de estado cuando una o más entidades en la capa están ocultas. Es decir, el icono se muestra en la barra de estado cuando la propiedad Visible de una o varias capas está inhabilitada.

PRECAUCION: Si la capa no es visible, no se podrán ver ni seleccionar entidades de la misma. Esto se aplica tanto si la capa está bloqueada como si está sin bloquear.  Esto significa que la opción Visible se impone sobre la opción Bloqueado.


Comando Mover puntos y texto

Utilice este comando para acceder al diálogo Mover. Este sólo está disponible si hay un conjunto de selección actual. Para acceder al mismo, seleccione Editar / Mover puntos y texto. Aparece el diálogo Mover .


Diálogo Mover

Utilice este diálogo para mover puntos o texto.

Para acceder al mismo, seleccione Editar / Mover puntos y texto.

Los puntos que tengan calidad Control, Control Fijo, o Ajustada no se mueven. Si alguno de los puntos que usted ha seleccionado para mover tiene calidad Ajustada, de Control Fijo, o Control, se mostrará un mensaje de aviso.

Los puntos movidos tienen inhabilitadas todas las observaciones o coordenadas del punto.

ADVERTENCIA: Al mover un punto se inhabilitarán todas sus observaciones o todas sus coordenadas. Usted puede habilitarlas utilizando la ventana Propiedades. Si las observaciones y coordenadas vuelven a habilitarse, el punto se colocará en su posición original.

Seleccione el texto o los puntos e introduzca la nueva posición en el diálogo. El movimiento se realiza en cuanto usted haga clic en Aceptar en dicho diálogo.

Mover según

Seleccione la opción Mover según para mover el texto o puntos seleccionados a la nueva ubicación definida por los desplazamientos Norte y Este (incrementos).

Hay dos opciones disponibles:

Incremento Este	Esta opción añade el valor del incremento Este visualizado a los valores Este de todas las entidades seleccionadas.

Incremento Norte	Esta opción añade el valor del incremento Norte visualizado a los valores Norte de todas las entidades seleccionadas.

Mover al punto

Seleccione esta casilla de verificación para mover los puntos seleccionados a la posición de otro punto.

Nombre

Utilice este campo para nombrar o seleccionar el punto de la nueva ubicación.

Mover a la coordenada

Seleccione esta casilla de verificación para mover el texto o punto seleccionado a la nueva posición. Hay dos opciones disponibles:

Este	Utilice este campo para introducir o seleccionar el nuevo valor Este para el punto seleccionado.

Norte	Utilice este campo para introducir o seleccionar el nuevo valor Norte para el punto seleccionado.

Configurar elevaciones en nulas para todos los puntos movidos

Seleccione esta casilla de verificación para especificar las elevaciones de los puntos movidos con valores nulos.  Si no selecciona esta opción, se mantiene la elevación del punto existente.

NOTA: Se inhabilitarán todas las observaciones de un punto que se ha movido.


Diálogo Puntos duplicados

Más Información

 Véase también

Cuando se importe un archivo que contenga un punto con el mismo nombre que otro punto del proyecto; en el proyecto se crearán puntos con el mismo nombre. Se mostrará el diálogo Puntos duplicados con el siguiente mensaje:

“Esta operación de importación ha creado puntos con el mismo nombre en la base de datos, (puntos duplicados)”

Esto puede solucionarse:

  mezclando los puntos con nombres duplicados si usted sabe que se refieren al mismo punto físico

  renombrando los puntos con nombres duplicados si no se refieren al mismo punto físico


Comentarios

Sus comentarios acerca de la documentación de soporte nos ayudan a mejorar la documentación con cada revisión.

Para enviar sus comentarios, seleccione una de las siguientes opciones:

  Envíe un correo electrónico (email) a ReaderFeedback@trimble.com

  Llene el Formulario de comentarios del lector que se encuentra al dorso del manual y envíelo por correo o fax de acuerdo con las instrucciones al pie del formulario. Si no hay uno disponible, podrá enviar sus comentarios y sugerencias a:

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642
Sunnyvale, CA 94086
EE.UU.

Atención: Grupo de publicaciones técnicas

Teléfono: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
www.trimble.com/

Todos los comentarios y sugerencias serán propiedad de Trimble Navigation Limited.

Agradecemos su colaboración.


Comando Nuevo proyecto

Utilice este comando para crear un nuevo proyecto o una plantilla nueva.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Nuevo proyecto.

  Haga clic en el botón Nuevo proyecto [image] en la barra de herramientas Estándar.

  Presione Ctrl+N.

Aparece el diálogo Nuevo proyecto.


Diálogo Nuevo proyecto

Utilice este diálogo para crear un nuevo proyecto o una plantilla nueva.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Nuevo proyecto.

  Haga clic el botón Nuevo proyecto [image] en la barra de herramientas estándar.

  Presione Ctrl+N.

  Haga clic en el acceso directo Proyecto en la barra de proyectos.

Nombre

Introduzca el nombre del proyecto que quiere crear. Se crea una carpeta nueva con el nombre del proyecto en la carpeta actual del proyecto seleccionada con el botón Carpeta.

Plantilla

La lista Plantilla muestra las plantillas del proyecto disponibles en el sistema. La utilización de plantillas del proyecto en Trimble Geomatics Office es parecida al uso de documentos de plantilla en Microsoft Word o dibujos prototipo en AutoCAD. Usted crea todos los proyectos nuevos utilizando una plantilla para formar la base de su nuevo proyecto. La plantilla que utilice permanece sin cambiar.

SUGERENCIA: Los nuevos estilos CAD añadidos a una plantilla están disponibles para los proyectos que se basen en dicha plantilla. Cuando el trabajo continuo en una zona determinada requiera una serie de proyectos individuales, es probable que usted quiera crear una plantilla que incluya el sistema de coordenadas concreto de la zona, estilos especiales, y puntos de control, por ejemplo, de forma que estos estén inmediatamente disponibles para todos los proyectos.

Una vez definidas las plantillas del proyecto, usted puede utilizarlas muchas veces con proyectos diferentes.

De los nombres de plantilla mostrados en la lista, seleccione el más apropiado. La plantilla que seleccione forma la base del nuevo proyecto que está creando.

Detalles

Esta lista muestra información de sistema de coordenadas y las cabeceras de la plantilla seleccionada. Esto le ayuda a seleccionar la plantilla más apropiada.

Además, se muestra la carpeta donde se crea y mantiene el proyecto. Esta carpeta refleja lo que se ha definido directamente en el campo Nombre o al utilizar Carpeta.

Las opciones de proyección se han predefinido en el proyecto de la plantilla; y la proyección puede cambiarse.

Carpeta

Haga clic en Carpeta para seleccionar la carpeta en la que quiere crear el proyecto nuevo.

Si selecciona la carpeta utilizando Carpeta se cambia la ubicación por defecto a utilizar por Trimble Geomatics Office la próxima vez que usted abra o cree un proyecto.

Utilice la estructura de árbol de carpetas mostrada en el diálogo Buscar carpeta, y realice uno de los siguientes pasos:

  Seleccione directamente una carpeta de proyecto.

  Seleccione la carpeta que contenga varios proyectos.

Nuevo

Haga clic en Nuevo para crear un nuevo proyecto o una plantilla nueva.

Cuando se configure a Plantilla, usted puede crear una plantilla nueva en la carpeta apropiada basada en la plantilla actualmente seleccionada. Puede utilizar esto para generar plantillas nuevas para fines concretos.


Comando Abrir proyecto

Utilice este comando para abrir un proyecto existente.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Abrir proyecto.

  Haga clic en el botón Abrir proyecto [image] de la barra de herramientas Estándar.

  Presione Ctrl+O.

Aparece el diálogo Abrir proyecto.


Diálogo Abrir proyecto

Utilice este diálogo para abrir un proyecto existente.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Abrir proyecto.

  Haga clic en el botón Abrir proyecto [image] de la barra de herramientas Estándar.

  Presione Ctrl+A.

NOTA: Si ya tiene un proyecto abierto, se le avisará que esta acción cerrará el proyecto actual.

NOTA: En el diálogo Abrir proyecto, se mostrará una vista preliminar del proyecto.

Nombre

Introduzca el nombre del proyecto que quiere abrir.

Aparece una lista de proyectos en la carpeta actual del proyecto bajo el campo Nombre. Seleccione uno de estos nombres de proyecto para que se introduzca automáticamente en el campo Nombre.

También puede introducir el camino en el campo Nombre para el proyecto que quiere abrir.

Por ejemplo, puede tener varios proyectos en la carpeta MYPROJ en la unidad C:\.

Introduzca C:\myproj\. Trimble Geomatics Office muestra los proyectos de esta carpeta que hay disponibles para seleccionar. La apertura de un proyecto de esta manera no cambia la carpeta del proyecto por defecto como ocurre cuando usted hace clic en Carpeta. Véase la siguiente descripción del botón Carpeta:

Carpeta

Haga clic en Carpeta para seleccionar la carpeta desde la que va a abrirse un proyecto.

Use la estructura en árbol de Carpeta mostrada en el diálogo Buscar carpeta y realice uno de los siguientes pasos:

  Seleccione directamente una carpeta de un proyecto.

  Seleccione una carpeta que contenga varios proyectos.

Detalles

Esta lista muestra información de sistema de coordenadas y las cabeceras de la plantilla seleccionada. Esto le ayuda a seleccionar la plantilla más apropiada.

Este cuadro muestra el sistema de coordenadas y las cabeceras del proyecto y contiene la carpeta donde se almacena el proyecto. Esto le ayuda a seleccionar el proyecto más apropiado. La información puede modificarse con Archivo / Propiedades proyecto / ficha Unidades y formato.

NOTA: Si abre un proyecto existente creado teniendo instalados los módulos WAVE Baseline Processing (Procesamiento de líneas base WAVE) y Network Adjustment (Ajuste de la red), los datos del levantamiento quedan sin modificar. Usted puede ver los datos derivados de los módulos inhabilitados (tales como las elipses de error y las líneas base procesadas). Otras tareas adicionales que requieran la utilización de módulos inhabilitados no están disponibles.


Comando Cerrar proyecto

Utilice este comando para cerrar el proyecto actual.

Para acceder al mismo, seleccione Archivo / Cerrar proyecto.

Todas las modificaciones efectuadas en el proyecto (incluidos los conjuntos de selección y vistas guardadas) se guardan a medida que trabaja en el proyecto. Puede cerrar un proyecto sin guardarlo primero.


Comando Eliminar proyecto

Utilice este comando para eliminar un proyecto.

Para tener acceso al mismo, seleccione Archivo / Eliminar proyecto.

Aparece el diálogo Eliminar proyecto.


Diálogo Eliminar proyecto

Utilice este diálogo para eliminar un proyecto. El proyecto debe estar cerrado.

Para tener acceso al mismo, seleccione Archivo / Eliminar proyecto.

SUGERENCIA: Los proyectos eliminados pueden recuperarse de la papelera de reciclaje.

Nombre

Introduzca el nombre del proyecto que quiere eliminar.

En el diálogo Eliminar, se muestra una lista de proyectos en la carpeta actual del proyecto bajo el campo Nombre. Seleccione uno de estos nombres de proyecto para introducir automáticamente el nombre en el campo Nombre.

También puede introducir el camino del directorio del proyecto que quiere eliminar.

Por ejemplo, usted puede tener varios proyectos en la carpeta MYPROJ en la unidad C:\.

Introduzca C:\myproj\. Trimble Geomatics Office muestra los proyectos en esta carpeta que hay disponibles para selección. Si elimina un proyecto de esta forma no se cambia la carpeta proyecto por defecto a diferencia de lo que ocurre cuando utiliza Carpeta. Véase la siguiente descripción de Eliminar grupo.

Eliminar grupo

Para ver los proyectos que quiere eliminar, seleccione la opción Proyecto.

Para ver las plantillas que quiere eliminar, seleccione la opción Plantilla.

Carpeta

Haga clic en Carpeta para seleccionar la carpeta de la que va a eliminar un proyecto. Si selecciona una carpeta utilizando Carpeta se cambia el valor por defecto a utilizar por Trimble Geomatics Office la próxima vez que usted abra o cree un proyecto.

Utilice la estructura de árbol de carpetas mostrada en el diálogo Buscar carpeta, y realice uno de los siguientes pasos:

  Seleccione directamente una carpeta de proyecto.

  Seleccione la carpeta que contenga varios proyectos.

Eliminar

Haga clic en Eliminar para eliminar el proyecto seleccionado. Todas las carpetas y archivos incluidos en el proyecto se eliminan.

Detalles

Este grupo muestra el sistema de coordenadas y las cabeceras del proyecto y visualiza la carpeta donde se almacena el proyecto. Use esta información para asegurarse de que va a eliminar el proyecto correcto.


Comando Importar

Utilice este comando para abrir el diálogo Importar.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Importar.

  Haga clic en el botón Importar [image] de la barra de herramientas Estándar.

  Utilice el grupo Importar de la barra de proyectos.

Aparece el diálogo Importar.


Comando Exportar

Utilice este comando para exportar datos a otro formato o a un dispositivo Trimble.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Exportar.

  Haga clic en el botón Exportar [image] de la barra de herramientas Estándar.

Aparece el diálogo Exportar.


Comando Configuración hoja

Utilice este comando para cambiar las opciones de distribución de página antes de generar un dibujo.

Usted puede:

  Seleccionar el formato de hoja que quiere utilizar para su dibujo

  Asignar la escala, origen, y orientación del dibujo

Para tener acceso al mismo, seleccione Archivo / Configuración hoja.

Aparece el diálogo Configuración hoja.


Diálogo Configuración hoja

Utilice este diálogo para cambiar las opciones de distribución de página antes de generar un dibujo. Puede seleccionar el formato de hoja que quiere utilizar para su dibujo y asignar la escala, origen, y orientación del mismo.

Para tener acceso al mismo, seleccione Archivo / Configuración hoja.

Formato de hoja

Un formato de hoja proporciona una plantilla para su dibujo. Esta plantilla puede personalizarse con el fin de proporcionar los componentes del dibujo (tales como una flecha Norte o el logo de su compañía), así como la región de la plantilla, marco, línea, y anotación de texto. El formato de hoja se aplica al tamaño de hoja configurado para la impresora o plóter y coincidirá con la especificación horizontal o vertical de la impresora o plóter.

Estas configuraciones pueden cambiarse utilizando Especificar impresora.

En el campo Archivo, introduzca el nombre de archivo del formato de hoja deseado.

Examinar

El diálogo Examinar muestra una lista de archivos de formato de hoja disponibles (*.frm).

Seleccione el nombre de archivo del formato de hoja que requiere.

Trimble Navigation Limited suministra varios formatos de hoja diferentes para su utilización. Usted puede crear los suyos propios. Para obtener más información, véase Formatos de hoja – Visión de conjunto.

Escala, Rotación dibujo, Origen N (Norte), Origen E (Este)

Utilice estos campos para definir la zona del proyecto a dibujar.

Una vez que haya configurado una escala, en la ventana gráfica se muestra un “cuadro de dibujo” que representa la zona del proyecto a dibujar. Se basa en las coordenadas del origen. Cambie la escala para aumentar o disminuir la cobertura del dibujo.

SUGERENCIA: Especifique el campo Rotación dibujo con el valor de la rotación requerida para el dibujo. Este valor configura la orientación del lado de la hoja del dibujo, en vez de la rotación del punto norte del dibujo. Es probable que se mueva el cuadro del dibujo, si ocurre, desplácelo gráficamente alrededor de los datos con el fin de que contenga los datos del proyecto.

Haga clic en los campos Origen Norte o Origen Este, y a continuación haga clic y arrastre el ‘cuadro del dibujo’ de forma que abarque la zona requerida. Usted puede configurar el campo Rotación dibujo con el valor que proporcione la orientación requerida. Al utilizar este campo se especifica la orientación lateral de la hoja del dibujo y no la rotación del punto norte del dibujo.

Aceptar

Haga clic en Aceptar para confirmar la configuración de hoja de su dibujo. Estos detalles de la distribución se almacenan y más tarde se utilizan con la opción Dibujar/Imprimir.

Lo mejor

Haga clic en Lo mejor para que el sistema calcule valores óptimos para los campos Escala y Origen con el fin de dibujar todos los datos visualizados del proyecto actual. Cuando utilice esta optación el valor por defecto seleccionado de la rotación del dibujo es 0°.

Especificar impresora

Haga clic en este botón para abrir el diálogo Especificar impresora del sistema. Utilice este diálogo para seleccionar la impresora o plóter apropiados, elegir el tamaño y fuente del papel, y seleccionar la orientación de la salida del dibujo en papel (horizontal o vertical).


Formato de hoja - Visión de conjunto
Formato de hoja − Visión de conjunto

Un archivo de formato de hoja (*.frm) se almacena como un archivo de texto. Contiene una serie de instrucciones que describen el contenido y ubicación a colocar en el formato de hoja. En un formato de hoja se pueden incluir líneas, texto y símbolos de definición (por ejemplo, punto Norte), y metarchivos mejorados (*.wmf) de Microsoft Windows para conseguir la disposición deseada.

Comentarios

En los formatos de hoja suministrados, hay comentarios que explican el significado de los diversos comandos disponibles en la definición de formato de plano. Utilice un editor de texto para editar una definición de formato de hoja. Las definiciones suministradas generalmente se encuentran en la carpeta del sistema de la carpeta del programa principal (normalmente, C:\ Archivos del programa\Trimble\Trimble Geomatics Office).

SUGERENCIA: Durante la instalación de Trimble Geomatics Office, el editor de texto Bloc de notas de Microsoft se asigna a la operación de apertura de la extensión de archivo. Así pues, cuando se selecciona un archivo de formato de hoja, o cuando se resalta un archivo .frm en el Explorador de Windows, usted puede utilizar la opción Abrir en el menú de acceso directo para presentar los detalles del formato de hoja en el Bloc de notas de Microsoft.

Para obtener más información, véase el tema Detalles de la definición de formatos de hoja.


Detalles de la definición de formatos de hoja

 Visión de conjunto

Las definiciones de formatos de hoja se almacenan en un formato similar al formato estándar de archivo *.ini de Windows. Este está formado por varias cabeceras de sección entre corchetes rectos ( [ ] ). En cada sección se definen los elementos individuales, y cada elemento tiene un nombre único y un valor de carácter ‘=’ apropiado. Los comentarios pueden colocarse en el archivo, pero deben estar en su propia línea y deben empezar con un punto y coma (;).

Un sistema de coordenadas especial de la definición de formatos de hoja permite que el mismo formato de hoja se utilice con tamaños de hoja de dibujo diferentes. Se asume que todos los valores de coordenadas están en milímetros y siempre se especifican en pares separados por comas que van entre paréntesis, con el valor x (u horizontal) primero y el valor y (o vertical) después.

Por ejemplo (20,40) es una posición de coordenadas válida. La esquina del dibujo de la parte superior izquierda de la hoja se define con las coordenadas +0.0, +0.0. Se interpreta que todos los valores de coordenadas positivos se encuentran a la derecha y por debajo de esta posición. La esquina inferior derecha del dibujo de la hoja se define con las coordenadas−0.0, −0.0. Se interpreta que todos los valores de coordenadas negativos se encuentran por encima y a la izquierda de esta posición.

NOTA: Las esquinas de la hoja son los límites del dibujo (o impresión) actual que puede realizarse en una hoja determinada por el plóter o impresora. Estos límites varían según las diversas impresoras y plóters. Los límites son afectados por factores tales como la manera en que la hoja se sujeta en los cilindros de un plóter, por ejemplo.

Como ejemplo, la siguiente tabla muestra diversas posiciones de coordenadas y las interpretaciones de las mismas:

Secciones

Las secciones de la definición de un archivo de formato de hoja son:


Comando Dibujar / Imprimir

Utilice este comando para:

  Ver una lista de impresoras y plóters instalados.

  Especificar la impresora o plóter por defecto.

  Acceder a las otras opciones de impresión o dibujo de la impresora o plóter seleccionado.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Archivo / Dibujar/Imprimir.

  Presione Ctrl+I.

Antes de poder imprimir en Trimble Geomatics Office, debe:

  Conectar el plóter o impresora a la computadora o a una red.

  Instalar un controlador de plóter o impresora utilizando la Instalación o el panel de control de Microsoft Windows, si aún no hay uno presente. Para obtener más información, véase la ayuda de Microsoft Windows.

  En el diálogo de especificación de dibujo o impresora, seleccione el plóter o impresora que quiere utilizar.

NOTA: Si hay líneas de cuadrícula visualizadas en la ventana de gráficos, las mismas se dibujarán en el dibujo.


Comando Propiedades del proyecto

Utilice este comando para abrir el diálogo Propiedades proyecto. Para tener acceso al mismo, seleccione Archivo / Propiedades proyecto.


Comando Ultimo proyecto

El menú Archivo lista los cuatro proyectos últimos recientemente abiertos.

Para abrir un proyecto recientemente utilizado, seleccione uno de la lista del menú Archivo.


Comando Salir

Utilice este comando para cerrar el proyecto actual y salir de Trimble Geomatics Office.

Trimble Geomatics Office guarda los cambios automáticamente.


Comando Copiar proyecto

Utilice este comando para hacer una copia de un proyecto existente de Trimble Geomatics Office. Este comando sólo está disponible cuando no haya un proyecto abierto.

Aparece el diálogo Proyecto a copiar.


Diálogo Proyecto a copiar

Utilice este diálogo para seleccionar el proyecto que quiere copiar.

Para acceder al mismo:

  Seleccione Archivo / Copiar proyecto.

Esta opción sólo está disponible cuando no haya ningún proyecto abierto.

Seleccione un proyecto de la lista.

Los detalles del proyecto seleccionado aparecen bajo la lista de proyectos.

Carpeta

Para seleccionar un proyecto de una carpeta diferente, haga clic en Carpeta.

Cuando haya seleccionado el proyecto que quiere copiar, haga clic en Aceptar.

Aparece el diálogo Copiar proyecto.


Diálogo Copiar proyecto a

Utilice este diálogo para introducir el nuevo nombre para el proyecto que va a copiar.

Título proyecto

Introduzca el nombre para el proyecto.

Carpeta

Realice uno de los siguientes pasos:

  Haga clic en el botón con puntos suspensivos para copiar el proyecto en una carpeta. diferente.

  Introduzca la ruta de acceso de la carpeta utilizando el teclado.


Sitio Protocolo de transferencia de archivo (File Transfer Protocol) (FTP)

Utilice el sitio FTP de Trimble para enviar o recibir archivos tales como ajustes de software, utilidades y respuestas a Preguntas formuladas con frecuencia (FAQs). También puede acceder al FTP desde el sitio de Trimble en la World Wide Web: http://www.trimble.com/support/support.htm


Formatos GIS - Visión de conjunto
Formatos GIS − Visión de conjunto

Más información

Cómo ...	Véase también

Visión de conjunto

Usted puede exportar puntos y sus atributos asociados, de Trimble Geomatics Office a gran variedad de formatos de Sistema de Información Geográfica (GIS). No se exportan líneas, arcos, curvas, texto, ni anotaciones.

Véase la tabla siguiente:

Durante la exportación, usted puede crear nuevos atributos para exportar (por ejemplo, la hora o fecha en que se capturó el atributo, o la elevación del punto).

Asimismo puede crear formatos para exportar ASCII personalizados o formatos de informes para exportar puntos y sus atributos.

Dos Formatos GIS Personalizados se listan a continuación:

  Nombre, Latitud, Longitud, Altura, All Attributes (Todos los atributos) (Local)

  Nombre, Norte, Este, Elevación, All Attributes (Todos los atributos)

Utilice la tabla GIS para exportar datos a una variedad de formatos GIS.

Para acceder a esta ficha:

1.	Realice uno de los siguientes pasos:

  Seleccione Archivo / Exportar.

  Use el grupo Exportar de la barra de proyectos.

Aparece el diálogo Exportar.

2.	Seleccione la ficha GIS.

Usted puede trasladar formatos personalizados a esta ficha. Para obtener más información, véase archivo Asciiexp.dat.

Para obtener más información sobre la exportación a un formato GIS, véase Formatos para exportar GIS.

Esta ficha tiene los siguientes formatos:


Opción Archivos ArcView (*.dbf, *.shp, *.shx)

Cuando se exporte al formato ArcView, se crean tres archivos para cada código de característica con atributos.

La siguiente tabla se describen estos archivos:

Estos archivos son binarios. No pueden verse ni editarse con un editor de texto.

Trimble Geomatics Office nombra estos archivos automáticamente.

Por ejemplo, si usted tiene puntos con atributos para el código de característica ‘Arbol’, se  crean los siguientes archivos:

  Arbol.shp

  Arbol.shx

  Arbol.dbf

Para obtener información sobre las configuraciones ArcView, véase el tema diálogo Opciones para exportar. La única configuración adicional que tiene ArcView es la que se aplica a todos los formatos.

NOTA: Sólo la versión 3.1 ó posterior de ArcView soporta puntos 3D.


Opción Archivo AutoCAD con atributos (*.dxf)

Cuando se exporte al archivo AutoCAD con atributos (*.dxf), se crea un archivo .dxf.

Use el formato de archivo Drawing eXchange (.dxf) para intercambiar y visualizar datos gráficos y tabulares.

Configurar

Además de las configuraciones estándar descritas en el diálogo Opciones para exportar, también existen configuraciones específicas para AutoCAD.

Haga clic en Opciones. Aparece el diálogo Opciones para exportar.

Tamaño texto

Automático	El tamaño del texto se calcula automáticamente a partir del archivo de entrada.
Fijo	El tamaño del texto es fijo. Realice uno de los siguientes pasos:  En el campo Tamaño texto, introduzca el tamaño que quiere que tenga el texto.  Use los botones de flecha.
Opciones bloque

Seleccione la casilla de verificación Exportar Características en Bloques para exportar la información de atributos en bloques. Esto significa que los atributos pueden consultarse y editarse al ser leídos en un sistema GIS o CAD que soporte el formato .dxf. El grupo Punto Inserción Bloque está disponible. Hay dos opciones para ubicar un punto de inserción en un bloque:

  Origen	Ubique el punto de inserción en la posición 0,0 del bloque.

  Centroide	Ubique el punto de inserción en el centroide calculado del bloque.

Si la casilla de verificación Exportar Características en Bloques no se ha seleccionado, estas opciones no estarán disponibles. En su lugar, la información acerca de la posición de una característica se almacena como una entidad de POLILINEA o PUNTO y la información de atributo se escribe como TEXTO. El TEXTO se escribe en la capa apropiada de cada característica. El grupo Punto inserción bloque no está disponible.

NOTA: Si no exporta características en bloques, no se exportarán los nombres de atributo—sólo los valores de los atributos. Si va a exportar a cualquiera de los módulos GIS AutoCAD, por ejemplo AutoCAD Map, exporte siempre en bloques de forma que se incluyan los nombres de atributo.

Opciones capa

Los archivos .dxf organizan los distintos tipos de información en capas. Estas capas pueden manipularse independientemente. Hay dos opciones de capa:

  Una característica por capa − se crea una capa diferente para cada característica. Por ejemplo, las características de poste se ubican en una capa diferente de las características de árbol. El nombre de cada capa es el nombre de la característica.

  Todas las características en una capa − todas las características se ponen en una única capa. El campo Nombre de capa está disponible. Introduzca el nombre de la capa en el campo Nombre de capa. Este campo no puede dejarse en blanco.

Cambia los espacios de los nombres de característica por guiones

Algunos de los programas que leen archivos .dxf requieren que los nombres de capa de los archivos .dxf no tengan espacios. Seleccione esta opción para convertir cualquier espacio de los nombres de característica en el carácter (_).


Opción Archivos MapInfo (*.mif, *.mid)

Cuando exporte al formato MapInfo, se crean dos archivos para cada código de característica con atributos. Estos se tratan en la siguiente tabla:

Estos son archivos de texto. Usted puede verlos o editarlos con un editor de texto. A continuación se muestra un ejemplo de estos archivos:

VERSION 2

  DELIMITER "	"

  COORDSYS EARTH PROJECTION 1, 104

COLUMNS 3

  Height_m  DECIMAL(5,0)

  Needs_attention  CHAR(30)

  Remarks  CHAR(30)

DATA

POINT 700345.32 306565.45

POINT 700356.47 306125.38

POINT 700937.71 306505.41

MID File

1	Yes	Branches in wires

2	Yes	Dead

3	No	Directly beside pole

Trimble Geomatics Office nombra estos archivos automáticamente. Por ejemplo, si tiene puntos con atributos para el código de característica ‘árbol’, se crean los siguientes archivos:

  árbol.mif

  árbol.mid

La única configuración adicional que tiene MapInfo es la que se aplica a todos los formatos. Esta se describen en el tema del diálogo Opciones para exportar.

NOTA: MapInfo sólo soporta puntos 2D.


Opción Archivo Microstation (*.dgn)

Cuando se exporta al formato Microstation (*.dgn), se crea un archivo. Debe introducir el nombre del archivo que quiere exportar.

Configurar

Además de las configuraciones disponibles para todos los formatos en el diálogo Opciones para exportar, existen las siguientes opciones disponibles para configurar la forma en que puede exportar al formato Microstation DGN.

Hacer seleccionable

Seleccione esta casilla de verificación para cerciorarse que el archivo .dgn que se crea tiene características ‘seleccionables’. Con esta opción en MicroStation, si se hace clic cerca de la característica el cursor salta a la posición exacta.

Unidad de resolución

Introduzca la unidad de resolución de las posiciones GPS en el archivo de salida. Si quiere superponer los datos GPS con datos existentes en formato .dgn es importante que las unidades de resolución de ambos archivos sean las mismas.

Las dos opciones son:

  Automático − las unidades de resolución se calculan automáticamente a partir del campo Cifras Decimales Coordenadas en Archivo / Propiedades proyecto / ficha Unidades y formato del proyecto de Trimble Geomatics Office.

  Definido por el usuario − En este campo las unidades de resolución pueden especificarse manualmente.

Origen global

Especifique cómo seleccionar el origen global. Si quiere que se superpongan los datos GPS con datos existentes en formato .dgn, es importante que el origen global de ambos archivos sea el mismo.

Las dos opciones son:

 Automático − El origen global se calcula a partir del archivo de entrada (o archivos) automáticamente.

 Definido por el usuario − En este campo las coordenadas X, Y y Z del origen global pueden especificarse manualmente.


Diálogo Opciones para exportar (Exportar GIS)

Utilice este diálogo para editar las opciones del formato de Sistema de Información Geográfica (GIS) al que va a exportar.

Para acceder a este cuadro de diálogo:

1.	Seleccione Archivo / Exportar.

Se abre el diálogo Exportar.

2.	Seleccione la ficha GIS.

3.	Haga clic en Opciones.

NOTA: Las opciones disponibles en este diálogo dependen del formato para exportar que haya elegido. Estas configuraciones se describen en los temas de formato pertinentes:

  Archivos Arcview (*.dbf, *.shp, *.shx)

  Archivo AutoCAD con atributos (*.dxf)

  Archivos MapInfo (*.mif, *.mid)

  Archivo Microstation (*.dgn)

A continuación se tratan las configuraciones comunes a todos los formatos (a excepción de las configuraciones dependientes del formato).

Formato de archivo

Hay tres tipos diferentes de formatos de archivo:

  formato DOS

Seleccione esta opción si el sistema de destino se ejecuta con MS-DOS o contiene texto en el conjunto de caracteres ASCII de MS-DOS. Los archivos de texto en este formato tienen terminaciones de registro del tipo <Retorno del carro> <Nueva línea>.

  formato Windows

Seleccione esta opción si el sistema de destino se ejecuta con el sistema operativo Microsoft Windows o contiene texto en el conjunto de caracteres ANSII. Los archivos de texto en este formato tienen terminaciones de registro del tipo <Retorno del carro> <Nueva línea>.

  formato UNIX

Seleccione esta opción si el sistema de destino se ejecuta con el sistema operativo UNIX. Los archivos de texto en este formato tienen terminaciones de registro del tipo <Nueva línea>.

NOTA: Para cada formato GIS sólo están disponibles los formatos de archivo válidos.

Dimensiones

Si la exportación GIS soporta puntos tridimensionales (3D), usted puede exportar dos puntos bidimensionales (2D) (Norte, Este), o puntos tridimensionales (Norte, Este, Elevación). Esta opción no está disponible si el formato GIS no soporta puntos 3D.

CONSEJO: Si el GIS no soporta puntos 3D, para exportar elevaciones haga clic en Atributos y seleccione la opción Elevación del punto.

Atributos

Haga clic en Atributos para seleccionar los atributos generados que quiere exportar con los puntos. Se abre el diálogo Atributos. Utilice este diálogo para configurar la manera en que quiere que se exporten los valores de los atributos de menú.

NOTE: Las opciones disponibles en el diálogo Atributos son las mismas en todos los formatos GIS.


Diálogo Atributos (opciones para exportar GIS)

Utilice este diálogo para seleccionar cualquier otro valor de atributo que quiere que Trimble Geomatics Office incluya con la exportación del archivo. Los atributos se crean utilizando los valores apropiados almacenados con los puntos de la base de datos. En este diálogo, no puede crear sus propios atributos para añadir.

Las opciones disponibles en el diálogo Atributos son las mismas en todos los formatos del Sistema de Información Geográfica (GIS).

Atributos generados

Seleccione la combinación de opciones que desee añadir para cada punto exportado. Esto resulta útil si va a exportar a un GIS bidimensional y quiere exportar elevaciones. En el software GIS al que va a exportar, todos los atributos generados se muestran como atributos normales.

NOTA: Los atributos generados de hora y fecha se exportan en el formato más reciente utilizado en la biblioteca de características y atributos.

Exportar atributos menú como

Cuando se define un archivo de biblioteca de características y atributos (*.fcl) o uno de diccionario de datos (*.ddf), se puede especificar hasta dos valores de código para cada elemento de atributo menú.

Por ejemplo, considere un código de característica ‘Arbol’ con un atributo menú ‘Tipo’. Cada elemento del menú puede tener valores de código. El tipo ‘Nativo’ puede tener valores de código NV y NT. Los atributos de tipo de los puntos con un código de característica de árbol con atributos pueden exportarse como el valor de atributo real (por ejemplo, Nativo), ‘Código usuario 1’ (por ejemplo, NV), o ‘Código usuario 2’ (por ejemplo, NT). Esto resulta útil si su GIS sólo soporta valores de atributo de dos caracteres.

Para obtener más información sobre valores de código, véase la ayuda en pantalla de la utilidad Editor de características y atributos de Trimble.


Comando Temas de la ayuda

Use este comando para abrir la ayuda en pantalla.


Comando Sugerencia del día

Este sistema proporciona sugerencias para ayudar al usuario a utilizar el software Trimble Geomatics Office.

Elija este comando para visualizar la sugerencia siguiente.

Para que se muestren sugerencias cada vez que inicie el software Trimble Geomatics Office, seleccione la casilla de verificación Mostrar sugerencias al iniciar.


Diálogo Sugerencia del día

Este sistema proporciona sugerencias para ayudar al usuario a utilizar el software Trimble Geomatics Office.

Para que se muestren sugerencias cada vez que inicie el software Trimble Geomatics Office, seleccione la casilla de verificación Mostrar sugerencias al iniciar.


Comando Acerca de Trimble Geomatics Office

Cómo ...

Utilice este comando para visualizar el programa, información sobre derechos de autor, y el número de versión del software Trimble Geomatics Office.


Diálogo Acerca de Trimble Geomatics Office

Este diálogo muestra el programa, información sobre derechos de autor, y el número de versión del software Trimble Geomatics Office.


Utilización de la Ayuda

Hay varias formas de obtener ayuda mientras utiliza el software Trimble Geomatics Office.

Para conseguir ayuda en un diálogo	Asegúrese de que el diálogo está activo y presione F1.
Para conseguir ayuda en un comando de menú	1. Ubique el cursor sobre el comando de menú y mantenga presionado el botón izquierdo del ratón. 2. Presione F1.
Para buscar un tema en el sistema de ayuda utilizando el Contenido	Seleccione la ficha Contenido para mirar los temas por categorías, como en un libro.
Para buscar un tema en el sistema de ayuda utilizando el Indice	Seleccione la ficha Indice para ver la lista de entradas del índice. Escriba la palabra que quiere buscar o desplácese por la lista.
Para buscar un vocablo o frase en el sistema de ayuda	1. Seleccione la ficha Buscar. 2. Puede que aparezca el asistente de configuración de Buscar. Si es así, seleccione la opción Minimizar tamaño de base de datos y haga clic en Siguiente > y a continuación haga clic en Terminar. 3. En el campo Type the word(s) you wish to find (Escriba las palabras que desea buscar), introduzca la palabra o frase que quiere encontrar. 4. En caso necesario, en el campo Select matching word(s) to narrow the search (Seleccionar palabra(s) coincidente(s) para reducir la búsqueda) seleccione una palabra para reducir la búsqueda. 5. En el campo Choose topic to display (Elegir tema a visualizar), seleccione un tema. Se visualizará a la derecha de la ventana de Ayuda. SUGERENCIA: Para reconstruir el índice, seleccione Buscar / Opciones.
Para imprimir un tema de la ayuda	Para imprimir el tema de Ayuda actual, haga uno de los siguientes pasos:  Haga clic en Imprimir.  Desde el menú Archivo elija Imprimir tema.  Use el botón derecho del ratón para hacer clic dentro de la ventana de la Ayuda, y a continuación elija Imprimir tema. NOTA: Usted puede imprimir temas individuales de la Ayuda pero no libros de la Ayuda.  Para imprimir información en una ventana desplegable, utilice el botón derecho del ratón para hacer clic en su interior, y a continuación haga en Imprimir tema.
SUGERENCIA: Haga clic en Atrás en la barra de herramientas de la Ayuda para ver los temas que ha visto anteriormente.


Registros de nota

 Visión de conjunto y más información

Para obtener informes de notas de la base de datos del proyecto de Trimble Geomatics Office, cree un informe personalizado de la base de datos. Estos se basan en los tipos de registro primarios o consultas definidas en la base de datos.

La creación de un informe personalizado comprende dos partes:

  La definición del conjunto de selección

  La creación de un formato de informe


Definición del conjunto de selección

Para seleccionar tipos de registro no gráfico (por ejemplo, registros de nota):

1.	Realice uno de los siguientes pasos:

  Utilice el conjunto de selección del archivo .dc.

  Elija Seleccionar / Por consulta.

2.	Seleccione los tipos de registro.

NOTA: Si selecciona Toda base de datos, el informe incluye todas las notas de la base de datos.


Creación de un formato de informe

Para hacer esto:

1.	Seleccione Informes / Informes Adicionales. Aparece el diálogo Informe Adicional. La lista de informes muestra todos los informes actualmente disponibles.

2.	Haga clic en Nuevo para crear un formato de informe nuevo. Aparece el diálogo Definir formato informe.

3.	En el campo Nombre, introduzca un nombre para el informe.

4.	En el campo Informe sobre, seleccione Registros de nota.

5.	En el campo Cuerpo del formato, realice uno de los siguientes pasos:

  Introduzca [Nota].

  Utilice el menú de acceso directo y seleccione Nota.

Se abre el visor HTML por defecto que muestra el informe. Usted puede imprimir o guardar el informe.


Informes de registros de nota (capturados en el campo) con información de punto

Los registros de notas no están directamente relacionados con los puntos en Trimble Geomatics Office. Por lo tanto, no se puede exportar registros de notas e información de punto (por ejemplo N, E, notas) utilizando el proceso mencionado anteriormente. Sin embargo, se pueden exportar notas a través del campo de código característico.

Para hacer esto:

1.	Utilizando  la utilidad  DC Editor, en el archivo .dc, encuentre los Registros vectoriales GPS (GPS VEC) seguidos de una nota.

2.	En estos campos de Registro vectoriales GPS, diríjase al campo CODIGO y tecleé un guión después del código actual, seguido de la información de Nota. Por ejemplo, ARBOL – Pino.

Cuando el registro es importado, el registro de nota es añadido  al final del campo de código característico. La nota es posteriormente asociada con un punto y se puede informar:

  Punto, Norte, Este, Código característico

NOTA: Algunas veces, el campo de Registro vectorial GPS es seguido por un Sello de tiempo y luego el registro de nota. En este caso, el Sello de tiempo se asocia con el código característico en lugar del punto. Usted deberá borrar el registro del sello de tiempo.


Creación de un informe de puntos personalizados
Creación de un informe de puntos personalizado

 Visión de conjunto y Más Información

Para obtener informes de registros de punto de la base de datos de Trimble Geomatics Office, cree un informe de base de datos personalizada. Estos se basan en los tipos de registro o consultas principales definidos en la base de datos.


Creación de un informe de base de datos personalizada

1.	Seleccione Informes / Informe adicional. Aparece el diálogo Informe adicional. La lista de informes muestra todos los informes actualmente disponibles.

2.	Haga clic en Nuevo para crear un formato de informe nuevo. Aparece el diálogo Definir formato de informe.

3.	En el campo Nombre, introduzca un nombre para el informe. Por defecto, los registros de punto se muestran en el campo Informe sobre.

4.	Haga clic en Rellenar formato automáticamente y Trimble Geomatics Office completa los campos Cabecera de formato y Cuerpo de formato. Estos formatos son editables.

SUGERENCIA: Haga clic con el botón derecho en los campos Cabecera de formato y Cuerpo de formato. Seleccione Campos, y elija los códigos de campo disponibles de la lista.

6.	Haga clic en Aceptar.

Se abre el visor HTML por defecto que muestra el informe. Usted puede imprimir o guardar el informe.


Cambio de la zona de la proyección del proyecto

 Visión de conjunto y más información

NOTA: La zona debe estar en la base de datos del sistema de coordenadas.

1.	Seleccione Archivo / Propiedades de proyecto. Aparece el diálogo Propiedades de proyecto.

2.	Seleccione la ficha Sistema de coordenadas.

3.	En el grupo  Configurar Sistemas de coordenada, haga clic en Cambiar. Aparece el  diálogo Seleccionar sistemas de coordenadas.

4.	Seleccione la opción de Nuevo Sistema y luego haga clic en Siguiente. Aparece el diálogo Seleccionar tipo de sistema de coordenadas.

5.	Seleccione la opción de Sistema de Coordenadas y Zona, luego haga clic en Siguiente.

6.	En el grupo Zona del sistema de coordenadas, resalte el sistema de coordenadas que contenga la zona pertinente.

7.	En el grupo de Zona, seleccione la zona requerida y luego haga clic en Siguiente. Aparece el diálogo Seleccionar modelo geoidal.

8.	Realice uno de los siguientes pasos:

  Seleccione el modelo geoidal que requiera para el proyecto.

  Haga clic en sin modelo geoidal.

9.	Haga clic en Terminar.

El sistema de coordenadas se aplica a la base de datos. Todos los puntos existentes en la base de datos se convierten al nuevo sistema de coordenadas.

Si tiene posiciones de punto o introduce coordenadas con elevaciones nulas en su proyecto y no se ha definido una elevación de proyecto, no se podrá seleccionar un sistema de coordenadas. Esto es debido a que Trimble Geomatics Office no puede convertir puntos existentes de un sistema a otro sin una elevación aproximada.


Exportación de un archivo de mapa de fondo a Trimble Survey Controller

 Visión de conjunto y más información

1.	Realice uno de los siguientes pasos:

  Seleccione Archivo / Exportar.

  Haga clic en la Herramienta Exportar.

Aparece el diálogo Exportar.

2.	En la ficha de levantamiento, seleccione la opción Biblioteca de caract. y atributos al Survey Controller (*.fcl). Aparece el diálogo Seleccionar biblioteca de caract. y atributos.

3.	Haga clic en Examinar para localizar el archivo .fcl que desea exportar.

4.	Seleccione la casilla de verificación Exportar atributos para exportar las definiciones de atributo contenidas en la biblioteca de características y atributos. Esta opción permite que los atributos estén disponibles en Trimble Survey Controller. Si la casilla de verificación se inhabilita, no se exportará ninguno de los atributos definidos en el archivo .fcl.

NOTA: También se exportan los códigos de control.

5.	Haga clic en Aceptar.	Aparece el diálogo Guardar como de Transferencia de datos.

6.	Compruebe que el dispositivo (que ejecuta Trimble Survey Controller) está conectado a la computadora.

7.	Seleccione un dispositivo Survey Controller y haga clic en Abrir. Aparece el diálogo Conectando.

Cuando se haya realizado la conexión, aparece el diálogo Guardar.

8.	Realice uno de los siguientes pasos:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo no tiene una tarjeta PC, este diálogo no está disponible.

9.	Haga clic en Abrir. Se lee la ubicación seleccionada. Se muestran todos los archivos de biblioteca de características y atributos del directorio. El nombre interno de la biblioteca de características y atributos aparece en el campo Nombre de archivo.

10.	Edite el campo Nombre de archivo para cambiar el nombre del archivo de Trimble Survey Controller si es pertinente. El nombre original del archivo de su computadora no se cambia.

11.	Haga clic en Guardar. Aparece el diálogo Cargando. La barra de progreso visualiza el progreso de la transferencia.

Cuando la transferencia se ha completado, el diálogo Cargando desaparece y cesa la conexión al dispositivo.

La biblioteca se ha transferido.


Exportación de un formato GIS

 Visión de conjunto y Más Información

1.	Realice uno de los siguientes pasos:

  Seleccione Archivo / Exportar.

  Haga clic en la Herramienta Exportar de la barra de herramientas Estándar.

Aparece el diálogo Exportar.

2.	En la ficha GIS, seleccione el formato que corresponda.

3.	Para cambiar las opciones de configuración de los formatos para exportar, haga clic en Opciones. Esto le permite configurar opciones apropiadas para el formato GIS al que está exportando.

4.	Haga clic en Aceptar. Aparece el diálogo Nombre de archivo.

5.	Especifique un nombre para el nuevo archivo y haga clic en Guardar para crear el archivo (o archivos) nuevos.


Creación de un archivo de cuadrícula de datum combinado (.cdg) para transferir a Trimble Survey Controller

 Visión de conjunto y más información

NOTA: Para crear una cuadrícula de datum combinado nueva, usted sólo puede utilizar el archivo de cuadrícula de datum actualmente utilizado en el proyecto. No obstante, usted puede exportar cualquier cuadrícula de datum combinado. Sólo puede transferir este archivo a Trimble Survey Controller versión 7.00 ó posterior.

1.	Seleccione Archivo / Exportar.

Aparece el diálogo Exportar.

2.	En  la ficha de levantamiento, seleccione la opción Cuadrícula del datum al Survey Controller (*.cdg) y haga clic en Aceptar. Aparece el diálogo Exportar cuadrícula del datum.

3.	Seleccione la opción Crear archivo de cuadrícula de datum combinado para exportarlo al Survey Controller.	Aparece el diálogo Crear archivo cuadrícula del datum combinado.

El cuadro amarillo del globo define la zona cubierta por los archivos de cuadrícula de latitud y longitud. Estos se especifican en la zona derecha del diálogo Crear archivo cuadrícula del datum combinado.

Para reducir el tamaño del archivo, utilice la herramienta Seleccionar en el lado izquierdo del diálogo Crear archivo cuadrícula del datum combinado. Arrastre la casilla de verificación negra sobre la zona que hay dentro del cuadro amarillo para la que quiere crear la cuadrícula de datum combinado.

El tamaño del archivo muestra el tamaño, y los límites de latitud y longitud muestran el ámbito del archivo de cuadrícula de datum combinado que va a crearse.

4.	El campo de nombre del Survey Controller muestra el nombre de cuadrícula de datum combinado utilizada en el trabajo de Trimble Survey Controller. Añada un prefijo o sufijo al nombre si el software Trimble Survey Controller ya utiliza una cuadrícula de datum del mismo nombre. El nombre debe contener el nombre de la cuadrícula de datum original.

NOTA: Durante la importación de un archivo de Survey Controller (*.dc), Trimble Geomatics Office utiliza el nombre del Survey Controller para comprobar si el nombre del archivo .cdg utilizado en el campo coincide con la cuadrícula de datum definida para el proyecto de Trimble Geomatics Office. Si el nombre no incorpora el nombre del archivo de cuadrícula de datum original, la cuadrícula de datum no será reconocida.

6.	Haga clic en Aceptar.

Aparece el diálogo Nombre de archivo. El nombre de archivo por defecto tiene los primeros seis caracteres del nombre de cuadrícula de datum. Este no es el mismo que el utilizado por el Trimble Survey Controller – es el nombre del archivo .cdg a almacenar en el directorio Archivos de programa\Archivos comunes\Trimble\GeoData.

7.	Para especificar un nombre alternativo para el archivo, utilice el teclado para editar el campo Nombre de archivo y haga clic en Guardar. 	Aparece el diálogo Guardar como de Transferencia de datos.

8.	Seleccione un dispositivo de Survey Controller y haga clic en Abrir. Aparece el diálogo Conectando. Cuando haya logrado conectarse, se muestra el diálogo Guardar.

9.	Realice uno de los siguientes pasos:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo no tiene una tarjeta PC, este diálogo no está disponible.

10.	Haga clic en Abrir.

Se lee el directorio seleccionado. Se muestran todos los archivos de cuadrícula de datum combinado del directorio. El campo Nombre de archivo no está disponible. En él se muestra el nombre del archivo de datum combinado que aparece en Trimble Survey Controller.

11.	Haga clic en Guardar. Aparece el diálogo Cargando y la barra de progreso muestra el progreso de la transferencia. Cuando ésta se ha completado, aparece el diálogo Cargando y cesa la conexión al dispositivo.

Ahora puede utilizar el archivo en Trimble Survey Controller.


Subcuadricular y transferir un archivo de cuadrícula de geoide (.ggf) a Trimble Survey Controller

 Visión de conjunto y más información

NOTA: Usted sólo puede transferir un archivo de cuadrícula geoidal a Trimble Survey Controller versión 6.00 ó posterior.

1.	Seleccione Archivo  / Exportar. Aparece el diálogo Exportar.

2.	En la ficha de levantamiento, seleccione la opción Archivos de geoide al Survey Controller (*.ggf) y haga clic en Aceptar. 	Aparece el diálogo Exportar modelo geoidal.

3.	Para crear un nuevo archivo de cuadrícula de geoide, seleccione la opción Crear subcuadrícula de modelo geoidal para exportarla al Survey Controller para crear un nuevo archivo de cuadrícula de geoide y haga clic en Aceptar. Aparece el diálogo Crear Archivo de la Cuadrícula del Geoide.

NOTA: Elija la opción Exportar modelo geoidal existente al Survey Controller para exportar un archivo existente de este tipo.

El cuadro amarillo sobre el globo terráqueo define la zona cubierta por el modelo geoidal. Este junto al archivo de cuadrícula del geoide se especifican a la derecha del diálogo Crear archivo de la cuadrícula del geoide. Si el modelo geoidal abarca el mundo no se verá un cuadro amarillo.

4.   Para reducir el tamaño del archivo, utilice la herramienta Seleccionar en el lado izquierdo del diálogo Crear archivo de la cuadrícula del geoide. Arrastre la casilla de verificación negra sobre la zona ubicada dentro del cuadro amarillo para la que desee crear la cuadrícula del geoide.

El tamaño del archivo muestra el tamaño, y los límites de latitud y longitud muestran el ámbito del archivo de cuadrícula de geoide que va a crearse.

5.	El campo Nombre muestra el nombre del modelo geoidal subcuadriculado utilizado en el trabajo de Trimble Survey Controller. Añada un prefijo o sufijo al nombre si el Trimble Survey Controller ya utiliza un modelo geoidal del mismo nombre. El nombre debe contener el nombre del modelo geoidal original.

NOTA: Durante la importación de un archivo de Survey Controller (*.dc), Trimble Geomatics Office utiliza el campo de nombre para comprobar si el nombre del archivo .ggf utilizado en el campo coincide con el modelo geoidal definido para el proyecto de Trimble Geomatics Office. Asegúrese de que el nombre de archivo contiene el nombre del modelo geoidal original, de lo contrario el modelo geoidal no será reconocido.

6.	Haga clic en Aceptar.

Aparece el diálogo Guardar como. El nombre de archivo por defecto tiene los primeros seis caracteres del nombre del modelo geoidal. Este no es el mismo que el utilizado por Trimble Survey Controller. Es el nombre del archivo de cuadrícula geoidal a almacenar en el directorio Archivos de programa\Archivos comunes\Trimble\GeoData.

7.  Para especificar un nombre alternativo para el archivo, utilice el teclado para editar el campo Nombre de archivo y haga clic en Guardar. Aparece el diálogo Guardar como de Transferencia de datos.

8.	Seleccione un dispositivo de Survey Controller y haga clic en Abrir. Aparece el diálogo Conectando. Cuando haya logrado conectarse, aparece el diálogo Guardar.

9.	Realice uno de los siguientes pasos:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo de Trimble no tiene una tarjeta PC, este diálogo no estará disponible.

10.	Haga clic en Abrir.

Se lee el directorio seleccionado. Se muestran todos los archivos de cuadrícula geoidal del directorio. El nombre de la cuadrícula del geoide aparece en el campo Nombre de archivo del Survey Controller. Este nombre se utiliza para emparejar con el nombre de cuadrícula geoidal al transferir un archivo .dc a Trimble Geomatics Office utilizando el archivo.

11.	Haga clic en Guardar. Aparecerá el diálogo Enviando. La barra de progreso muestra el progreso de la transferencia. Una vez que ha concluido, aparecerá el diálogo Enviando y cesa la conexión al dispositivo.

Ahora puede utilizar el archivo en Trimble Survey Controller.

NOTA: También puede usarse la utilidad Trimble Grid Factory™ para subcuadricular archivos de modelo geoidal. Grid Factory forma parte de la opción personalizado del software Trimble Geomatics Office.

NOTA: Si está transfiriendo datos a o de Trimble Survey Controller versión 7.60 utilice el formato de archivo .dc, versión 7.50.


Subcuadricular y transferir un archivo de cuadrícula de geoide (.ggf) al software TDS Survey Pro CE

 Visión de conjunto y más información

NOTA: Solamente podrá transferir un archivo de cuadrícula de geoide al software TDS Survey Pro CE versión 4 ó posterior.

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	En la ficha Levantamiento, seleccione la opción Archivo de geoide al TDS Survey Pro CE (*.ggf) y haga clic en Aceptar. Aparecerá el diálogo Exportar modelo geoidal.

3.	Para crear un Nuevo archivo de cuadrícula de geoide, seleccione la opción Crear una subcuadrícula de un modelo geoidal para exportar y haga clic en Aceptar. Aparecerá el diálogo Crear archivo de la cuadrícula del geoide.

NOTA: Elija la opción Exportar archivo de cuadrícula de geoide existente para exportar un archivo existente de este tipo.

El cuadro amarillo en el globo define el area que cubre el modelo geoidal. El modelo geoidal y el archivo de cuadrícula de geoide se especifican en el lado derecho del diálogo Crear archivo de la cuadrícula del geoide. Si el modelo geoidal cubre el mundo, no se verá el cuadro amarillo.

4,	Para reducir el tamaño del archivo, use la herramienta Seleccionar en el lado izquierdo del diálogo Crear archivo de la cuadrícula del geoide. Arrastre el cuadro de selección Negro por el área dentro del cuadro amarillo para el que quiere crear el archivo de cuadrícula de geoide.

El tamaño de archivo muestra el tamaño, y los límites de latitud y longitud muestran el alcance del archivo de cuadrícula de geoide que se va a crear.

El campo Nombre muestra el nombre del modelo geoidal subcuadriculado que se ha utilizado.

NOTA: Durante la importación de archivos, Trimble Geomatics Office usa el campo Nombre para comprobar si el nombre del archivo .ggf utilizado en el campo coincide con el modelo geoidal definido para el proyecto de Trimble Geomatics Office. Asegúrese de que el nombre de archivo contiene el nombre del modelo geoidal original o el modelo geoidal no se reconocerá.

6.	Haga clic en Aceptar.

Aparecerá el diálogo Guardar como. El nombre de archivo por defecto consiste en los seis primeros caracteres del nombre del modelo geoidal. Es el nombre del archivo de cuadrícula de geoide el que se almacenará en el directorio Archivos de programa \Archivos comunes\Trimble\GeoData.

7.	Para especificar un nombre alternativo para el archivo, utilice el teclado para editar el campo Nombre de archivo y haga clic en Guardar. Aparecerá el diálogo Guardar como de Data Transfer (Transferencia de datos).

8.	Seleccione el dispositivo TDS Survey Pro CE y haga clic en Abrir. Aparecerá el diálogo Conectando. Una vez que se ha realizado la conexión, aparecerá el diálogo Guardar.

9.	Transfiera el archivo al dispositivo TDS Survey Pro CE.

Ahora podrá utilizar el archivo en el software TDS Survey Pro CE.

NOTA: También podrá emplear la utilidad Grid Factory para subcuadricular archivos de modelo geoidal. Grid Factory forma parte de la opción personalizada de Trimble Geomatics Office durante la instalación del software.


Utilización de datos del software TRIMMAP

Usted puede importar datos de trabajos creados con TRIMMAP al software Trimble Geomatics Office.

1.	En el software TRIMMAP, abra el trabajo que quiere procesar con Trimble Geomatics Office.

2.	Seleccione Herramientas / Importar / Exportar / Interfaces gráficas.	Aparece el menú Interfaces gráficas.

3.	Seleccione Interfaces gráficas / Crear archivo.

4.	Introduzca un nombre para el trabajo y un nombre de archivo de salida.

NOTA: En el campo Nombre de archivo de salida, cerciórese de que especifica el nombre y ubicación del archivo que va a crearse y proporcione la extensión .tgf. Por ejemplo C:\Temp\Topo_pts.tgf

5.	En Trimble Geomatics Office, seleccione Archivo / Importar. Aparece el diálogo Importar.

6.	En la ficha CAD / ASCII, seleccione la opción de archivo gráfico TRIMMAP y haga clic en Aceptar. Aparece el diálogo Seleccionar archivo.

7.	Navegue a la carpeta que contiene el archivo .tgf. y haga clic en Abrir.

El archivo se importa a Trimble Geomatics Office.


Creación de consultas nuevas

ADVERTENCIA: Trimble Navigation Limited soporta la utilización o modificación de esta base de datos sólo si se emplea el software Trimble Geomatics Office. Trimble no soporta ni autoriza, ni garantiza el funcionamiento de la base de datos si se emplean otras aplicaciones de software. Trimble puede modificar en cualquier momento el formato de esta base de datos haciendo que sea incompatible con otras aplicaciones de software.

 Visión de conjunto y más información

NOTA: Para definir consultas personalizadas, necesita el software Microsoft Access 2000 (ó posterior).

Este ejemplo crea una consulta que selecciona todos los puntos de la base de datos con valores de elevación nulos.

1.	En Microsoft Access, abra la base de datos de la plantilla (o proyecto) de Trimble Geomatics donde se quiere añadir la consulta. La base de datos se localiza en la plantilla o en la carpeta del proyecto (.mdb).

2.	Seleccione la ficha Consultas de la ventana gráfica principal y a continuación haga clic en Nuevo para crear una consulta nueva.

SUGERENCIA: Elija la opción Vista del diseño en lugar de la opción del Asistente de consultas.

3.	En el diálogo Mostrar tabla, seleccione la tabla de puntos, ya que usted quiere seleccionar entidades de punto y éstas se almacenan en esta tabla.

4.	Haga clic en Añadir antes de cerrar el diálogo.

Aparece un diálogo de consulta.

5.	Especifique la primera columna en la definición de consulta a toda la tabla de puntos. Esto puede hacerse arrastrando y colocando el identificador * desde la tabla de puntos en la sección superior del diálogo Consulta, o seleccionando Punto.* desde el cuadro Campo.

NOTA: La casilla de verificación Mostrar se selecciona por defecto. A no ser que vayan a seleccionarse entidades múltiples, normalmente es preferible restaurar toda la tabla. De esta forma la consulta puede utilizarse para otros fines (como en informes).

6.	Especifique la configuración de Campo en la segunda columna a Elevación (el identificador del campo Elevación).

Introduzca =0 en el campo Criterio de esta columna. Así se configura la comprobación de valores de elevación nulos.

7.	Para probar el funcionamiento de esta consulta, compruebe la vista del archivo de hoja de datos. Todos los puntos de la base de datos que tengan alturas nulas se mencionan en esta tabla.

8.	Para guardar la nueva consulta, ciérrela y nómbrela con un prefijo de “Seleccione_”. Por ejemplo, nómbrela “Seleccione_Puntos con elevaciones nulas”.

NOTA: Para añadir la consulta a las herramientas de selección de la Ventana Propiedades, utilice el prefijo “SortSS_” para la herramienta ordenar, “SvyFilterSS_” para la herramienta Filtrar (para los datos topográficos), y “PlanFilterSS_” para la herramienta Filtrar (para los datos CAD). Para utilizar la consulta en un informe personalizado, utilice el prefijo “Report_”.

9.	Antes de que la nueva consulta esté disponible en Seleccionar / Por consulta (y en cualquier lugar de Trimble Geomatics Office), debe actualizarse el archivo de esquema de la base de datos. Utilice el Explorador de Microsoft Windows para eliminar el archivo de esquema de la base de datos existente (.dbs) para el proyecto (o el proyecto de la plantilla).

NOTA: Cuando se abra un proyecto sin esquema de base de datos, Trimble Geomatics Office crea automáticamente un nuevo archivo de esquema basado en la configuración del archivo de base de datos. Este nuevo archivo contiene la referencia a la consulta recientemente añadida. La nueva consulta se muestra en Seleccionar / Por consulta. Usted puede utilizarla en definiciones de informe y definiciones ASCII personalizadas.

10.	Abra Trimble Geomatics Office, y abra la plantilla o proyecto al que ha añadido la consulta.

Ahora puede utilizar la nueva consulta eligiendo Seleccionar / Por consulta. La nueva consulta aparece en la lista.


Importación de un archivo Survey Controller (*.dc) de Trimble Survey Controller

 Visión de conjunto y más información

1.	Seleccione Archivo / Importar. Aparece el diálogo Importar.

2.	En la ficha de levantamiento, seleccione la opción Dispositivos topográficos y haga clic en  Aceptar. Aparece el diálogo Abrir de Transferencia de datos.

3.	Seleccione un dispositivo Survey Controller y haga clic en Abrir. Aparece el diálogo conectando.

Una vez lograda la conexión, el campo Buscar del diálogo Abrir cambia a dispositivo Survey Controller.

4.	Realice uno de los siguientes pasos:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo de Trimble no tiene una tarjeta PC, este diálogo no está disponible.

5.	Haga clic en Abrir. Se lee el directorio seleccionado. Se muestran todos los trabajos de Trimble Survey Controller del directorio.

6.	En el campo Formato de archivo, seleccione la versión del archivo de colector de datos que está utilizando.

7.	Seleccione el(los) archivo(s) que quiere importar y haga clic en Abrir. Aparece el diálogo Descargando y la barra de progreso muestra el progreso de la transferencia de archivos.	Una vez completada la transferencia, aparece el diálogo Descargando y cesa la conexión con el dispositivo.

El archivo del trabajo se ha convertido en un archivo .dc y se ha importado a la base de datos del proyecto. El archivo .dc se localiza en la carpeta del proyecto Archivos de Datos\Archivos Trimble.

NOTA: Cuando se transfiera un archivo .dc a Trimble Geomatics Office de un dispositivo que ejecuta Trimble Survey Controller, el archivo se importa automáticamente al proyecto.

NOTA: Si está transfiriendo datos de o a Trimble Survey Controller versión 7.60, utilice el formato de archivo .dc versión 7.50.


Importación de un archivo de datos GPS Trimble (.dat) a la computadora

1.	Seleccione Archivo / Importar. Aparece el diálogo Importar.

2.	En la ficha del levantamiento seleccione la opción archivo de datos GPS (*.dat)y haga clic en Aceptar. Aparece el diálogo Abrir.

3.	Localice el archivo .dat que quiere importar y haga clic en Abrir. Aparece el diálogo Comprobar DAT.

4.	Realice los cambios necesarios.

En particular, compruebe que los valores de la altura de antena son correctos. Si se modifican estos valores no se cambian los valores reales del archivo .dat, sólo se modifican los valores utilizados para importar el archivo en Trimble Geomatics Office. El archivo .dat se mantiene en su estado original.

5.	Haga clic en Aceptar.

Este se localiza en la carpeta del proyecto Archivos de datos\Archivos Trimble.

SUGERENCIA: El archivo puede arrastrarse y colocarse.


Importación de un archivo de datos GPS de Trimble (.dat) de un receptor GPS de Trimble

 Visión de conjunto y más información

1.	Seleccione Archivo / Importar. Aparece el diálogo Importar.

2.	En la ficha del levantamiento, seleccione la opción Dispositivos topográficos y haga clic en Aceptar. Aparece el diálogo Abrir de Transferencia de datos.

3.	Seleccione un dispositivo Receptor GPS y haga clic en Abrir. Aparece el diálogo Conectando.

Cuando se haya logrado la conexión, el campo Buscar del diálogo Abrir cambia al dispositivo de receptor GPS.

4.	Seleccione el(los) archivo(s) que quiere importar y haga clic en Abrir. Aparece el diálogo Descargando. La barra de progreso muestra el progreso de la transferencia de archivos.

Una vez completada la transferencia, el diálogo Descargando desaparece y cesa la conexión al receptor GPS.

Aparece el diálogo Comprobar DAT.

5.	Realice los cambios necesarios.

En particular, compruebe que los valores de la altura de antena son correctos. Si se modifican estos valores no se cambian los valores reales del archivo .dat, sólo se modifican los valores utilizados para importar el archivo en Trimble Geomatics Office. El archivo .dat se mantiene en su estado original.

6.	Haga clic en Aceptar. El archivo importado se localiza en la carpeta del proyecto Archivo de datos\Archivos Trimble.


Importación de un archivo de datos GPS Rinex

 Visión de conjunto y más información

1.	Seleccione Archivo  / Importar. Aparece el diálogo Importar.

2.	En la ficha del levantamiento, seleccione la opción de archivos RINEX y haga clic en Aceptar. Aparece el diálogo Abrir. Seleccione el(los) archivo(s) de observación que quiere importar. Si es necesario, cambie la opción Mostrar archivos de tipo. Haga clic en Abrir.

Si existe un archivo correspondiente .nav con el mismo nombre, éste es vinculado automáticamente con el archivo de observación.

Si el archivo correspondiente .nav no tiene el mismo nombre, aparece el diálogo Coincidencia archivos. Los archivos de observación son listados bajo Archivos de observación. Seleccione el archivo .nav adecuado y haga clic en Aceptar.

NOTA: Cada archivo de observación debe tener su archivo .nav correspondiente. Si no selecciona el correcto archivo .nav, aparece un mensaje al importar y las líneas base no pueden ser procesadas.

3.	El(os) archivo(s) se convierten al formato de archivo de datos GPS de Trimble. Aparece el diálogo Comprobar DAT

4.	Realice los cambios necesarios.

En particular, compruebe que los valores de la altura de antena y tipo de receptor estén correctos. Si se modifican estos valores no se cambian los valores reales del archivo .dat, sólo se modifican los valores utilizados para importar el archivo en Trimble Geomatics Office. El archivo .dat se mantiene en su estado original.

SUGERENCIA: Asegúrese que al comprobar datos, los tipos de receptor y tipos de antena no estén desconocidos.

5.	Haga clic en Aceptar.

El archivo importado se localiza en la carpeta del proyecto Archivos de datos\Archivos Trimble.


Creación de un formato para exportar/importar personalizado

Visión de conjunto y más información
Este ejemplo define un formato para exportar personalizado. El formato es un archivo de texto delimitado por comas que contiene el nombre del punto (en mayúsculas), el valor Norte (con unidades), el valor Este (con unidades), y la elevación (con unidades). Los códigos de campo se utilizan para seleccionar los campos correspondientes. Los formatos para importar personalizados se definen de forma parecida.

1.	Seleccione Archivo / Exportar. Aparece el diálogo Exportar.

2.	Seleccione la ficha Personalizado. Haga clic en Nuevo. Aparece el diálogo Definir formato para exportar ASCII

3.	En el campo Nombre, introduzca un nombre.

4.	Haga clic con el botón derecho en el campo Cuerpo del formato y seleccione Campos / Nombre del menú de acceso directo.

[Nombre] Aparece el cuadro Cuerpo de formato.

5.	Haga clic con el botón derecho y seleccione Campos / Avanzado / Modificadores / Mayúscula desde el menú de acceso directo.

En el cuadro Cuerpo de formato aparece [Nombre:Mayúscula]. Esto significa que todos los nombres de punto van a exportarse con letras mayúsculas.

6.	Introduzca una coma seguida de un espacio.

7.	Haga clic con el botón derecho y seleccione Campos / Norte desde el menú de acceso directo.

Al lado de la coma aparece [Norte]

8.	Haga clic con el botón derecho y seleccione Campos / Avanzado / Modificadores / Unidades desde el menú de acceso directo.

[Norte] cambia a [Norte:Unidades]. Esto significa que la unidad de coordenadas actual se incluye en el archivo.

9.	Introduzca una coma seguida de un espacio.

10.	Haga clic con el botón derecho y seleccione Campos / Este del menú de acceso directo.

Al lado de la coma aparece [Este].

11.	Haga clic con el botón derecho y seleccione Campos / Avanzado / Modificadores / Unidades desde el menú de acceso directo.

[Este] cambia a [Este:Unidades]. Esto significa que la unidad de coordenadas actual se incluye en el archivo.

12.	Introduzca una coma seguida de un espacio.

13.	Haga clic con el botón derecho y seleccione Campos / Elevación del menú de acceso directo.

Al lado de la coma aparece [Elevación].

14.	Haga clic con el botón derecho y seleccione Campos / Avanzado / Modificadores / Unidades del menú de acceso directo.

[Elevación] cambia a [Elevación:Unidades]. Esto significa que la unidad de coordenadas actual se incluye en el archivo.

15.	Haga clic en Aceptar para guardar el formato para exportar.

Aparece el diálogo Exportar. El formato se muestra en la lista de la ficha Personalizado.

16.	Para exportar datos con este formato, seleccione el formato y haga clic en Aceptar.

Aparece el diálogo Guardar como.

17.	En el campo Nombre de archivo, introduzca un nombre para el archivo para exportar y haga clic en Guardar. Se crea el archivo.


Exportación de un archivo Survey Controller (*.dc) a Trimble Survey Controller

 Visión de conjunto y más información

1.	Seleccione Archivo  / Exportar. Aparece el diálogo Exportar.

2.	En la ficha del levantamiento, seleccione la opción Dispositivos topográficos.

3.	Haga clic en Opciones para especificar las configuraciones del trabajo para el archivo. En el diálogo que aparece, haga clic en Aceptar para aceptar todas las modificaciones y volver al diálogo Exportar.

5.	Haga clic en Aceptar. Aparece el diálogo Guardar como de Transferencia de datos.

6.	Seleccione un dispositivo Trimble Survey Controller y haga clic en Abrir. Aparece el diálogo Conectando.

7.	Cuando se logre la conexión, aparece el diálogo Guardar.

8.	Realice uno de los siguientes pasos:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo de Trimble no tiene una tarjeta PC, este diálogo no está disponible.

9.	Haga clic en Abrir.

Se lee la carpeta seleccionada. Se visualizan todos los archivos Survey Controller en la carpeta. El nombre del proyecto de Trimble Geomatics Office aparece en el campo Nombre de archivo. Este es el nombre del trabajo de Trimble Survey Controller que va a exportarse a Trimble Survey Controller. Si es necesario, el nombre puede editarse.

10.	Haga clic en Guardar. Aparece el diálogo Cargando. La barra de progreso muestra el progreso de la transferencia. Cuando ésta se haya completado, desaparece el diálogo Cargando y cesa la conexión con el dispositivo.

Ahora puede utilizar el archivo en Trimble Survey Controller.

NOTA: Si está transfiriendo datos de o a Trimble Survey Controller versión 7.60 utilice el formato de archivo .dc versión 7.50.


Exportación de archivos AutoCAD (*.dxf)

 Visión de conjunto y más información

1.	Seleccione Archivo  / Exportar. Aparece el diálogo Exportar.

2.	En la ficha CAD / ASCII, seleccione la opción AutoCAD (*.dxf).

3.	Haga clic en Opciones para configurar la versión .dxf y el tipo al que quiere exportar.

4.	Haga clic en Aceptar. Aparece el diálogo Guardar como.

5.	Navegue a la carpeta en la que quiere guardar el archivo.

6.	Introduzca el nombre del archivo y haga clic en Guardar.

Se crea el archivo.

Por defecto, Trimble Geomatics Office exporta el nombre del punto como un atributo del punto. Para exportar otra información acerca del punto, edite las definiciones DXF/DWG atributos de bloque en el archivo Opciones .ini.

NOTA: Estos pasos pueden utilizarse para exportar un archivo de dibujo (*.dwg). En el Paso 4, haga clic en Opciones para configurar la versión y formato .dwg.


Cambio de las unidades de un proyecto

 Visión de conjunto y más información

1.	Seleccione Archivo / Propiedades de proyecto. Aparece el diálogo Propiedades de proyecto.

2.	En la ficha Unidades y formato, seleccione el campo en el que quiere cambiar las unidades y el formato.

3.	Seleccione la opción requerida de la lista y haga clic en Aceptar para aplicar los cambios.


Configuración de un proyecto con atributos

 Visión de conjunto y más información

1.	Seleccione Archivo / Propiedades de proyecto. Aparece el diálogo Propiedades de proyecto.

2.	En la ficha Características, seleccione la casilla de verificación Usar atributos.

El campo Biblioteca está disponible.

3.	Haga clic en Examinar para localizar el archivo de biblioteca de características y atributos (*.fcl) o el archivo de diccionario de datos (*.ddf) que requiere.

4.	Haga clic en Aceptar. El archivo seleccionado se utiliza para crear las tablas de base de datos para todos los códigos de característica con atributos. Ahora puede importar el archivo .dc con atributos.


Selección de un ajuste local guardado como el sistema de coordenadas del proyecto

 Visión de conjunto y más información

1.	Seleccione Archivo / Propiedades  de proyecto.

Aparece el diálogo Propiedades de proyecto.

2.	Seleccione la ficha Sistema de coordenadas.

3.	En el Grupo configurar Sistemas de coordenadas, haga clic en Cambiar. Aparece el diálogo Seleccionar sistema de coordenadas

4.	Seleccione Nuevo sistema y haga clic en Siguiente. Aparece el diálogo Seleccionar tipo del sistema de coordenadas.

5.	Seleccione Local calibrado y haga clic en Siguiente.

Aparece el diálogo Seleccionar ajuste calibrado.

6.	Seleccione el ajuste que requiera y haga clic en Terminar.

El sistema de coordenadas se aplica a la base de datos. Todos los puntos que existen en la base de datos se convierten al nuevo sistema de coordenadas. Para obtener información sobre el proceso de conversión, véase el tema Sistemas de coordenadas – Visión de conjunto.

Si tiene posiciones de puntos o ha introducido coordenadas con elevaciones nulas en el proyecto, y no se ha definido una elevación por defecto, no se logrará seleccionar un sistema de coordenadas, ya que Trimble Geomatics Office no puede convertir los puntos existentes de un sistema al otro.


Informe de atributos
Exportación de atributos

 Visión de conjunto y más información

Se puede exportar un archivo que contenga :

  todos los puntos con una característica específica.

  todos los atributos.

Para exportar archivos separados para cada característica, se puede hacer una de las siguientes cosas:

1.	Seleccionar puntos que contengan la característica de interés.

2.	Configurar un formato de exportación personalizado.


Selección de puntos que contengan la característica de interés

Para realizar esto:

1.	Desde la vista del plano, elija Seleccionar / Por característica de punto.

Por ejemplo, si quiere que se genere un informe sobre los atributos de un árbol, seleccione "árbol" en el diálogo Seleccionar por característica de punto.

2.	Haga clic en Aceptar.

Se seleccionan todos los puntos con el código de característica especificados.


Configuración del formato de informe personalizado

Para realizar esto:

1.	Seleccione Archivo / Exportar. Aparece el diálogo Exportar.

2.	En la ficha Personalizado, haga clic en Nuevo. Aparece el diálogo Definir formato exportar ASCII.

3.	En el campo Nombre, introduzca un nombre para el formato exportar.

4.	En el campo Descripción, introduzca la descripción del formato exportar.

Esta no es obligatoria para el formato.

5.	Cerciórese de que la Información de punto se selecciona en el campo Exportar de. Esto es necesario porque usted quiere generar un informe sobre puntos.

6..	Haga clic en Rellenar formato automáticamente para completar todos los demás campos de la tabla de puntos con la cabecera y cuerpo del formato.

7.	En el diálogo Insertar formato que aparece, seleccione los delimitadores apropiados para el formato.

8.	Elimine todas las cabeceras y campos que no quiera incluir en el formato.

9.	En la lista Cabecera del formato, añada todas las cabeceras de atributo que quiere incluir en el formato.

10.	Los registros de atributo no se almacenan en la tabla de puntos. Añada los campos a incluir en el formato de la tabla de características apropiada. Para acceder a estos campos, haga clic con el botón derecho en la lista Cuerpo del formato y seleccione el menú de acceso directo.

11.	Seleccione Campos / Avanzado / Atributos.	Se muestran todos los códigos de característica con atributos (de la biblioteca de características y atributos utilizada para configurar el proyecto con atributos.)

12.	Elija el mismo código de característica que ha seleccionado (por ejemplo "árbol").

Los atributos aparecen en un menú secundario adicional.

13.	Haga clic en el atributo que quiere que aparezca en el informe.

El atributo seleccionado aparece en el cuadro Cuerpo del formato.

NOTA: Si quiere generar un informe sobre todos los atributos de una característica concreta, desde el menú de acceso directo, seleccione la opción de asterisco (*). Todos los atributos se añaden al cuerpo del formato.

14.	Repita los pasos anteriormente descritos con todos los atributos que quiera exportar a un archivo.

15.	Complete el formato de exportar y haga clic en Aceptar. El formato se añade a la lista personalizada.

16. Para exportar un archivo en este formato, resalte el formato y haga clic en Aceptar.


Exportación de un sólo archivo con todos los atributos

Para realizar esto:

1.	Seleccione Archivo/ Exportar. Aparece el diálogo Exportar.

2.	En la ficha GIS, seleccione la opción Nombre, Latitud, Longitud, Altura, Todos los atributos (local) o la opción Nombre, Norte, Este, Altura, Todos los atributos.

3.	Haga clic en Aceptar.

4.	Aparece el diálogo GUARDAR.  Introduzca un nombre de archivo y locación y haga clic en Aceptar.

Se crea un archivo que contiene los atributos.


Importación de archivos de Survey Controller (*.dc) con atributos

 Visión de conjunto y más información

NOTA: Para utilizar atributos en Trimble Geomatics Office, usted debe configurar un proyecto con atributos primero.

1.	Seleccione Archivo  / Importar. Aparece el diálogo Importar.

2.	En la ficha del levantamiento, seleccione la opción Archivo de Survey Controller (*.dc) y haga clic en Aceptar.

Trimble Geomatics Office comprueba que el archivo de biblioteca de características y atributos (*.fcl) o el archivo de diccionario de datos (*.ddf) especificado en el proyecto actual de Trimble Geomatics Office es el mismo que el del archivo .dc.

Si son diferentes, tiene las siguientes opciones:

  Cancelar la importación.

  Importar todos los puntos, e información de atributo que reconozca el proyecto actual de Trimble Geomatics Office. Se le avisará que corre el riesgo de perder datos. El Informe para importar describe la información de atributo que no se haya importado.

  Sólo importar los puntos (sin información de atributo).

Si no se ha definido una biblioteca de características y atributos en el proyecto actual de Trimble Geomatics Office, usted puede importar el archivo .dc sin información de atributo o cancelar la importación.

NOTA: Si está transfiriendo datos de o a Trimble Survey Controller versión 7.60, utilice el formato de archivo .dc versión 7.50.


Adición de capas

 Visión de conjunto y más información

1.	Desde la Vista del plano, realice uno de los siguientes pasos:

  Seleccione Editar / Capas.

  Haga clic en la herramienta Editar capas.

Aparece el diálogo Capas.

2.	Haga clic en Nuevo.

En el diálogo Capas aparece una nueva fila.

3.	En el campo Nombre introduzca un nombre único para la capa nueva.

4.	De la lista seleccione un estilo de punto por defecto. Este estilo de punto se utiliza para todos los puntos para los que se haya seleccionado <Por capa> en el campo Estilo de punto.

5.	De la lista seleccione un estilo de línea por defecto.	Este estilo de línea se utiliza para todas las líneas, arcos, y curvas para los que se haya seleccionado <Por capa> en el campo Estilo de línea.

6.	De la lista seleccione un texto. Este estilo de texto se utiliza para todos los textos para los que se haya seleccionado <Por capa> en el campo Estilo de texto.

7.	Si quiere visualizar todas las entidades de una capa, seleccione la casilla de verificación Visible.

8.	Inhabilite la casilla de verificación Bloqueado para permitir que las entidades de la capa se seleccionen.

9.	Haga clic en Aceptar.


Mezcla de puntos con nombres duplicados

 Visión de conjunto y más información

Se puede mezclar puntos en Trimble Geomatics Office, si sabe que ambos se refieren al mismo punto físico, y si no los necesita que sean puntos separados.

PRECAUCION: Dos puntos diferentes con el mismo nombre pero con datos significativamente diferentes pueden ser el resultado de un error. Mezclarlos puede producir resultados inesperados.

1.	Cerciórese de que los puntos son el mismo punto físico. Para efectuar esto, seleccione Seleccionar / Duplicar Puntos/ Según Nombre y Distancia

2.	Introduzca una Distancia de separación y haga clic en Aceptar.

3.	Seleccione Editar / Mezclar Puntos Duplicados.

Trimble Geomatics Office mezcla todas las observaciones a los puntos y posiciones introducidas para los puntos. La barra de estado muestra un resumen de la operación de mezcla.


Especificar cómo los puntos duplicados son manejedos al ser importados
Especificar cómo son manejados los puntos duplicados en importación

 Vista de Conjunto y más información

Por defecto, Trimble Geomatics Office mezcla puntos con el mismo nombre al ser importados, por lo tanto, no se crean puntos duplicados. Se puede especificar dentro de qué tolerancia horizontal y/o vertical el software mezcla puntos, o si el software no resuelve puntos duplicados al ser importados, en el diálogo Duplicar Puntos.

1.	Seleccione Archivo/ Importar. Aparece el diálogo Importar.

2.	Haga clic en  Opciones. Aparece el diálogo Opciones Duplicar puntos.

Efectúe uno de los siguientes:

  Cerciórese de que esté seleccionada la Opción Siempre mezcle puntos duplicados.

  Seleccione la opción mezclar puntos duplicados dentro de tolerancia e introduzca la tolerancia apropiada.

  Para especificar que el software no resuelve puntos duplicados al ser importados, seleccione la opción Mezclar puntos duplicados e introduzca un valor de tolerancia horizontal de 0.02 (esto es, la tolerancia de calidad del levantamiento horizontal) y una tolerancia vertical de 0.050 (esto es, la tolerancia de calidad del levantamiento vertical).

NOTA: Si no especifica una tolerancia (esto es, en el grupo de tolerancias, las casillas de verificación horizontal y vertical no se seleccionan) los puntos duplicados se mezclarán.

NOTA: Si configura la tolerancia en 0.000, las coordenadas de puntos duplicados deben ser exactamente las mismas para los puntos a mezclar.

Estas configuraciones aplican a todas las opciones importar. El software Trimble Geomatics Office utiliza los últimos datos introducidos de los puntos duplicados ya sea  que importe archivos utilizando la barra de proyectos, o arrastre y bote archivos en un proyecto Trimble Geomatics Office.


Renombrar puntos duplicados

 Visión de conjunto y más información

Utilice este proceso para renombrar puntos duplicados, por ejemplo, cuando dos equipos de campo hayan usado los mismos nombres con puntos diferentes en archivos separados de Survey Controller (*.dc):

1. 	Importar los archivos utilizando la opción Mezclar puntos duplicados dentro de la tolerancia seleccionada en el cuadro de diálogo Opciones de Duplicar Puntos. Configure la tolerancia horizontal en 0.02 y la tolerancia vertical en 0.050.

NOTA: Si no se ha dado cuenta de que tiene puntos duplicados hasta después de haber importado los datos, deshaga la operación importar, establezca la opción Mezclar Puntos duplicados dentro de la tolerancia a 0.02 para la tolerancia horizontal (esto es, la tolerancia de calidad del levantamiento horizontal) y 0.05 para la tolerancia vertical (esto es, la tolerancia de calidad del levantamiento vertical) en el diálogo Opciones duplicar puntos y luego, vuelva a importar los datos.

2.	Seleccione el conjunto de selección del archivo de Survey Controller (*.dc) del que se añadieron los puntos duplicados a la base de datos. Alternativamente, seleccione Seleccionar\Duplicar puntos\Según nombre

3.	Seleccione Editar / Renombrar. Aparece el diálogo Renombrar.

4.	Introduzca el nuevo nombre del primer punto de la selección.

Trimble Geomatics Office renombra todos los puntos del conjunto de selección. Los puntos se renombran en función del valor de inicio asignado al conjunto.

Por ejemplo, asuma que ha seleccionado cinco puntos. Si sustituye el nombre del primer punto con el nombre "2000", los cuatro puntos que quedan se renombran 2001, 2002, 2003, y 2004.


Etiquetado de puntos utilizando etiquetas personalizadas

 Visión de conjunto y más información

Este ejemplo etiqueta puntos utilizando la etiqueta personalizada de la descripción de un punto.

1.	Utilice el Explorador de Microsoft Windows para localizar el archivo Options.ini de la plantilla del proyecto o proyecto al que quiere añadir la opción de etiqueta personalizada.

2.	Utilice un editor de texto para abrir el archivo Opciones.ini.

3.	Busque la cabecera:

[Etiquetas]

4.	Justo después de la última de las opciones de etiquetado, utilice el teclado para introducir el siguiente texto:

|X|[Y]

Donde ‘X’ define el nombre de la etiqueta, e ‘Y’ define el código de campo con el que quiere etiquetar el punto.

5.	Abra la plantilla del proyecto o el proyecto en Trimble Geomatics Office.

6.	Seleccione Ver / Rótulos punto. Aparecerá el diálogo Rotular puntos con con la nueva opción añadida a la lista.

7.	Seleccione las opciones que necesite y haga clic en Aceptar.


Anotación de entidades

 Visión de conjunto y más información

1.	Seleccione los puntos, líneas o arcos que quiere anotar. Para ello, utilice uno de los siguientes:

  el ratón

  el menú Seleccionar

2.	Seleccione Insertar / Anotaciones.	Aparece el diálogo Anotar.

3.	De la lista, seleccione la plantilla deseada.

4.	Para editar plantillas de anotación, haga clic en Plantillas.

  Para mantener anotaciones existentes, seleccione la casilla de verificación Retener anotaciones existentes.

 Para eliminar las anotaciones existentes antes de aplicar las nuevas, inhabilite la casilla de verificación Retener anotaciones existentes.

5.	Si ha seleccionado un grupo de entidades a anotar, compruebe que el grupo Anotar se ha configurado en Selección.

Si quiere anotar toda la base de datos, seleccione la opción Toda base datos.

Si no se ha seleccionado ninguna entidad, el grupo Anotar no está disponible, y se anota toda la base de datos.

6.	Haga clic en Aceptar para aplicar las anotaciones.

Estas últimas se añaden a la base de datos y se muestran en la ventana gráfica.


Creación de un conjunto de selección

 Visión de conjunto y más información

1.	Seleccione las entidades (puntos, líneas, observaciones, curvas, arcos, texto, anotaciones) que quiere incluir en el conjunto de selección. Para ello, utilice uno de los siguientes:

  el ratón

  el menú Seleccionar.

2.	Elija Seleccionar / Conjuntos de selección / Guardar. Aparece el diálogo Guardar.

3.	Introduzca un nombre para el conjunto de selección y haga clic en Aceptar.

El conjunto de selección aparece en la lista de conjuntos de selección guardados cuando se elija Seleccionar / Conjuntos de selección / Recuperar. Asimismo se muestra en la lista de conjuntos de selección recientemente utilizados cuando se elija Seleccionar / Conjuntos de selección.

SUGERENCIA: Utilice el diálogo Ver Filtros para ver selecciones de conjunto.


Realización de una calibración local GPS

 Visión de conjunto y más información

Puede ser necesario efectuar una calibración local GPS en Trimble Geomatics Office por cualquiera de las siguientes razones:

  para transferir una calibración a Trimble Survey Controller

  no efectuar calibración en el campo

  para crear un informe para registros de control de calidad

  para añadir puntos adicionales a una calibración efectuada en Trimble Survey Controller


Preparación para efectuar una calibración local GPS

Antes  de efectuar una calibración local GPS, debe cerciorarse que tiene coordenadas derivadas de datos terrestres (cuadrícula) o datos GPS (WGS-84) para cada punto de calibración.

Si ha efectuado una calibración en Trimble Survey Controller y los puntos de cuadrícula y los puntos GPS tienen el mismo nombre, estos puntos pueden haber sido mezclados al ser importados. Los puntos mezclados se separan automáticamente si escoge efectuar una calibración local GPS en Trimble Geomatics Office. Cuando esto ocurre, un mensaje le informa que ha sido usado el mismo nombre para los puntos GPS y los puntos cuadrícula en el software.

Realice uno de los siguientes pasos:

  Haga clic en Si para crear un punto GPS y un punto cuadrícula aparte con el mismo nombre en la base de datos.

  Haga clic en Cancelar si no desea efectuar una calibración local GPS o si desea separar puntos manualmente. Si separa puntos manualmente, tendrá la opción de renombrar los puntos GPS.


Efectuar la calibración local GPS

1.	Seleccione Medición / calibración local GPS. Aparece el diálogo Calibración local GPS.

2.	En el grupo de componentes de Calibración, seleccione los parámetros de calibración que quiere calcular.

3.	Haga clic en Lista de puntos. Aparece el diálogo Lista de puntos.

4.	Utilice el diálogo Lista de puntos para seleccionar el par de puntos (punto GPS y punto de la cuadrícula) para la calibración. Puede ser el mismo punto o uno distinto con el mismo nombre, con tal de que se puedan encontrar valores GPS y valores de cuadrícula separados.

5.	Con el primer punto GPS que requiera en la calibración, realice uno de los siguientes pasos:

  Utilice Rellenar campo para seleccionar el punto.

  Introduzca el nombre del punto utilizando el teclado.

En el punto GPS de la ventana gráfica, se muestra un cuadrado.

NOTA: Si posee un punto cuadrícula correspondiente con el mismo nombre, se llena la lista de punto automáticamente.

6.	Para introducir el punto de la cuadrícula asociado con el punto GPS seleccionado, realice uno de los siguientes pasos:

  Utilice Rellenar campo para seleccionar el punto.

 Introduzca el nombre del punto utilizando el teclado.

En el punto de la cuadrícula de la ventana gráfica, se muestra una cruz y en el diálogo Lista de puntos se añade una entrada nueva.

El tipo campo se actualiza para indicar si el punto seleccionado tiene un componente de coordenada horizontal o vertical (o ambos). Si no hay componentes de coordenadas comunes, el tipo se muestra inválido y no se usan las coordenadas.

7.	Repita los dos pasos anteriores para seleccionar todos los pares de puntos que se necesitan para la calibración.

8.	Cuando se hayan seleccionado todos los pares de puntos, haga clic en Cerrar para volver al diálogo Calibración local GPS.

NOTA: Las estadísticas de calibración aparecen en la parte baja del diálogo Puntos y se calculan después de ingresar un par de puntos válidos. Utilice éstas estadísticas para identificar los puntos pares incorrectos.

9.	Haga clic en Calcular para calcular los parámetros de calibración. Los resultados de la calibración se muestran en el grupo de resumen Calibración.

10.	Si los resultados están fuera de los rangos previstos, utilice el informe Calibración local GPS para comprobar todos los residuales grandes que haya entre los pares de puntos. Haga clic en Informe para generar el informe Calibración local GPS. El informe se muestra en el visor predeterminado HTML.

11.	Compruebe los residuales en la sección del informe Diferencias residuales entre GPS y coordenadas conocidas. Si es necesario, quite todos los pares de puntos sospechosos y vuelva a aplicar la calibración.

12.	Haga clic en Aceptar para aplicar la calibración al proyecto.

El sistema de coordenadas se actualiza con los parámetros de calibración.


Procesamiento de códigos de característica

 Visión de conjunto y más información

1.	Elija Seleccionar / Conjuntos de selección / Recuperar. Aparece el diálogo Recuperar.

2.	Seleccione el conjunto de selección que tenga el mismo nombre que el archivo a procesar (el archivo en el que se han capturado los códigos de característica). Este conjunto de selección se creó automáticamente cuando se importó el archivo y tiene un registro que muestra el orden con que los puntos se capturaron en el campo. Si utiliza este conjunto de selección, el procesamiento de códigos de característica se hará en el orden correcto.

3.	Seleccione Herramientas / Procesar códigos característica. Aparece el diálogo Procesar códigos característica.

4.	Seleccione la biblioteca pertinente para procesar los códigos de característica y haga clic en Aceptar.

Trimble Geomatics Office procesa los códigos de característica. Estos se muestran en la ventana gráfica.


Vista de un inverso

 Visión de conjunto y más información

Para determinar el inverso entre dos puntos de un proyecto:

1.	Seleccione Medición / Inverso. Aparece el diálogo Inverso y el puntero del ratón cambia al puntero de Rellenar campo.

2.	Haga clic en el primer punto que necesita para calcular el inverso. Su nombre aparece en el campo De en el diálogo Inverso.

3.	Haga clic en el segundo punto que necesita para calcular el inverso. Cuando el ratón se posicione sobre un punto, se muestra una línea discontinua.

El nombre del punto aparece en el campo A en el diálogo Inverso y los valores del inverso se muestran automáticamente en el grupo Inverso.

NOTA: Si se han introducido puntos utilizando el teclado, haga clic en Calcular para calcular el inverso.

4.	Haga clic en Detallado para ver información adicional sobre el cálculo del inverso. 	El grupo Detalles se adjunta a la parte inferior del diálogo y muestra información adicional acerca del inverso.

5.	Haga clic en Enviar a informe para generar un informe del inverso. Se creará un informe abreviado o uno detallado en función de la opción de presentación utilizada (breve o detallado).

6.	Haga clic en Mostrar informe para ver el informe en el visor HTML.

7.	Para ver otro inverso, haga clic en los campos de punto y vuelva a seleccionar los puntos.


Medición de áreas

Utilice la herramienta Medir para ver el acimut y distancia entre las dos últimas ubicaciones seleccionadas y el área creada por las ubicaciones seleccionadas en la operación de medición actual.

1.	Seleccione Medición / Medir. Aparece el diálogo Medir.

2.	Haga clic en la primera ubicación (que no tiene por que ser un punto) de la ventana gráfica.

3.	Continúe haciendo clic en las ubicaciones de la ventana gráfica. Cada vez que selecciona una ubicación, se utilizan las coordenadas para calcular los campos del diálogo Medir. Aparece una línea que une las ubicaciones seleccionadas.

Los campos del diálogo Medir se actualizan cada vez que usted haga clic en una ubicación nueva. Los valores no se almacenan en la base de datos.

4.	Haga clic en Restaurar para borrar los valores.


Realización de una transformación de coordenadas

 Visión de conjunto y más información

Utilice una transformación de coordenadas con la que trasladar y/o rotar los puntos seleccionados. Este ejemplo demuestra cómo transformar todos los puntos de la base de datos introduciendo las coordenadas conocidas de un punto existente.

1.	Seleccione los puntos que quiere transformar o rotar.

2.	Seleccione Medición / Transformación de coordenadas. Aparece el diálogo Transformación de coordenadas.

3.	Haga clic en Lista de puntos. Aparece el diálogo Transformación de coordenadas − Lista de Puntos.

4.	Realice uno de los siguientes pasos:

  En el campo Punto, introduzca el nombre del punto existente.

  Utilice Rellenar campo para seleccionar el punto.

Se completan los campos Punto, Norte actual, y Este actual y se selecciona el campo Norte conocido.

5.	En los campos Norte conocido y Este conocido, realice uno de los siguientes pasos:

  Introduzca los valores norte y este conocidos del punto.

  Utilice Rellenar campo para seleccionar los valores norte y este conocidos del punto.

En la ventana gráfica aparece una línea que muestra la diferencia entre las coordenadas actuales y las conocidas.

El grupo Estadísticas muestra el factor escala y el residuo horizontal máximo. Utilice éstos para identificar los puntos pares erróneos.

6.	Haga clic en Aceptar. Aparece un diálogo que visualiza los errores residuales.

7.	Vuelve a mostrarse el diálogo Transformación de coordenadas y se completan los campos Traslación Norte y Traslación Este con los valores calculados a partir de las coordenadas actuales y las conocidas.

8.	Haga clic en Aceptar para aplicar la transformación de coordenadas a toda la base de datos.

NOTA: La transformación de coordenadas puede deshacerse.


Realización de un ajuste de elevación

 Visión de conjunto y más información

Utilice un ajuste de elevación para ajustar las elevaciones de los puntos seleccionados. Este ejemplo muestra cómo ajustar las elevaciones de todos los puntos de la base de datos introduciendo la elevación conocida de un punto existente.

1.	Seleccione Medición / Ajuste de elevación. Aparece el diálogo Ajuste de elevación.

2.	Haga clic en Lista de puntos. Aceptar para volver al diálogo Ajuste de elevación − Lista de puntos.

3.	Realice uno de los siguientes pasos:

  En el campo Punto, introduzca el nombre de punto existente.

  Utilice Rellenar campo para seleccionar el punto.

Sobre el punto seleccionado aparece un cuadro.

Se completan los campos Punto, Norte actual, Este actual y Elevación actual.

4.	Realice uno de los siguientes pasos:

  En el campo Elevación conocida, introduzca la elevación conocida del punto.

  Utilice Rellenar campo para seleccionar la elevación de otro punto.

El grupo de Estadísticas muestra el factor de escala, el máximo ajuste de inclinación y el residuo vertical máximo. Use estos valores para identificar pares de puntos erróneos.

5.	Haga clic en Aceptar para volver a abrir el diálogo Ajuste de elevación.

Los campos Norte origen y Este origen se completan con las coordenadas del primer punto utilizado. El campo Constante de corrección se rellena con el ajuste de elevación calculado. Los campos Corrección por unidad Norte y Corrección por unidad Este sólo se completan si se utiliza más de un punto para definir el ajuste de elevación.

6.	Haga clic en Aceptar para aplicar el ajuste de elevación a toda la base de datos.

NOTA: El ajuste de elevación puede ser deshecho.


Utilización de códigos de campo

 Visión de conjunto y más información

Utilice códigos de campo para mostrar los valores de:

  campos

  variables en anotaciones, informes, formatos para exportar, texto

Los códigos de campo también son útiles para definir los formatos del informe y formatos para exportar. Este ejemplo demuestra cómo utilizar códigos de campo para definir un formato para exportar. El formato define un archivo de texto delimitado por comas que contiene el nombre del punto (en mayúsculas), el valor Norte (con unidades), el valor Este (con unidades), y la elevación (con unidades).

1.	Seleccione Archivo  / Exportar. Aparece el diálogo Exportar.

2.	En la ficha Personalizado, haga clic en Nuevo. Aparece el diálogo Definir formato para exportar ASCII.

3.	En el campo Nombre, introduzca un nombre.

4.	Haga clic con el botón derecho en el campo Cuerpo del formato y desde el menú de acceso directo, seleccione Campos / Nombre.

En el cuadro Cuerpo del formato aparece [Nombre].

5.	Haga clic con el botón derecho para acceder al menú directo y luego seleccione Campos / Avanzado/ Modificadores / Mayúscula

En el cuadro Cuerpo del formato aparece [Nombre:mayúscula]. Esto significa que todos los nombres de punto se exportarán en letras mayúsculas.

6.	Introduzca una coma seguida de un espacio.

7.	Haga clic con el botón derecho y seleccione Campos / Norte desde el menú de acceso directo.

Al lado de la coma aparece [Norte].

8.	Haga clic con el botón derecho para acceder al menú directo y seleccione Campos / Avanzado / Modificadores / Unidades

[Norte] cambia a [Norte:Unidades]. Esto significa que la unidad de coordenadas actual se incluye en el archivo.

9.	Introduzca una coma seguida de un espacio.

10.	Haga clic con el botón derecho para acceder al menú de acceso directo y luego seleccione Campos / Este

Al lado de la coma aparece [Este].

11.	Haga clic con el botón derecho y seleccione Campos / Avanzado / Modificadores / Unidades desde el menú de acceso directo.

[Este] cambia a [Este:Unidades]. Esto significa que la unidad de coordenadas actual se incluye en el archivo.

12.	Introduzca una coma seguida de un espacio.

13.	Haga clic con el botón derecho y seleccione Campos / Elevación del menú de acceso directo.

Al lado de la coma aparece [Elevación].

14.	Haga clic con el botón derecho y seleccione Campos / Avanzado/ Modificadores / Unidades desde el menú de acceso directo.

[Elevación] cambia a [Elevación:Unidades]. Esto significa que la unidad de coordenadas actual se incluye en el archivo.

15.	Haga clic en Aceptar para guardar el formato para exportar.

Aparece el diálogo Exportar. El formato creado se muestra en la lista de la ficha Personalizado.

16.	Para exportar datos con este formato, seleccione el formato y haga clic en Aceptar. 	Aparece el diálogo Guardar como.

17.	En el campo Nombre de archivo, introduzca un nombre para el archivo de exportación.

18.	Haga clic en Guardar. Se crea el archivo.


Utilización de Rellenar campo

 Visión de conjunto y más información

Utilice Rellenar campo para introducir valores en los campos a partir de las entidades existentes en la base de datos. Cuando Rellenar campo está disponible, el puntero correspondiente aparece en la ventana gráfica. Este ejemplo utiliza Rellenar campo para seleccionar las coordenadas cuando se añade una entidad de texto.

1.	Seleccione Insertar / Texto. Aparece el diálogo Insertar texto.

2.	Introduzca el texto en el campo Expresión de texto.

3.	Seleccione el campo Norte.

4.	Posicione el puntero sobre la ventana gráfica. Aparece el puntero de Rellenar campo.

5.	Haga clic en la ubicación de la ventana gráfica donde quiere que aparezca el texto.

Los campos Norte y Este se completan con valores de coordenadas.

6.	Haga clic en Aceptar para añadir el texto a la base de datos.

SUGERENCIA: Puede utilizar Rellenar campo para introducir los tiempos de observación (haciendo clic en la observación).


Especificación gráfica de la hoja (dibujo e impresión)

 Visión de conjunto y más información

1.	Seleccione Archivo  / Configuración hoja. Aparece el diálogo Configuración hoja.

2.	Haga clic en Lo mejor.

3.	Haga clic en el campo Norte origen o Este origen. Aparece el puntero de Rellenar campo.

4.	Haga clic en la zona de la ventana gráfica en que quiere que se muestre la zona superior izquierda del trazado.

5.	Especifique la rotación que adapte de la mejor manera los datos del proyecto al formato de hoja seleccionado.

6.	En la ventana gráfica, haga clic y arrastre el cuadro del dibujo sobre los datos del proyecto.

7.	Cambie la escala a un valor estándar. Por ejemplo, si la mejor adaptación del dibujo es 1:435, cámbiela a 1:500.

8.	Haga clic en Aceptar para aplicar las configuraciones de Configuración hoja.


Selección del modelo geoidal de un proyecto

 Visión de conjunto y más información

Para seleccionar el modelo geoidal de un proyecto, utilice el Asistente de sistemas de coordenadas. Esto también se aplica incluso si quiere cambiar el modelo geoidal del sistema de coordenadas actual.

1.	Seleccione Archivo / Propiedades de proyecto.

Aparece el diálogo Propiedades de proyecto.

2.	Seleccione la ficha Sistema de coordenadas.

3.	En el grupo Configuración sistema de Coordenadas, haga clic en Cambiar.  Aparece el  diálogo Seleccionar sistema de coordenadas

4.	Seleccione la opción Nuevo sistema y haga clic en Siguiente. Aparece el diálogo Seleccionar tipo de sistema de coordenadas.

5.	Seleccione el tipo de sistema de coordenadas correcto. Aparece el diálogo Seleccionar modelo geoidal al final del asistente de selección de sistemas de coordenadas. Seleccione el modelo geoidal que requiera. La lista de modelos geoidales disponibles se lee de la base de datos del sistema de coordenadas. Por defecto se selecciona el modelo geoidal predeterminado del sistema de coordenadas.

6.	Haga clic en Terminar.

El modelo geoidal seleccionado se aplica al proyecto.

NOTA: Usted puede seleccionar el modelo geoidal por defecto de un sistema de coordenadas usando la utilidad Administrador de Sistemas de Coordenadas.


Corte y copia de puntos con atributos entre proyectos

 Visión de conjunto y más información

1.	Desde el proyecto de origen, seleccione los puntos que quiere copiar en el proyecto de destino. Utilice el comando Seleccionar / Por característica de punto (disponible en la vista del plano) para seleccionar puntos con la característica que especifique.

2.	Para copiar los puntos necesarios en nuevo proyecto, seleccione Editar / Copiar.

3.	En el proyecto de destino, seleccione Editar / Pegar para pegar los puntos.

4.	Si las definiciones de atributos de los dos proyectos son diferentes, se muestra un diálogo.

5.	Haga clic en Sí para pegar los datos que son comunes a ambas bibliotecas de características y atributos. Todos los datos de atributo que no se hayan pegado, se registran en el informe Pegar.rpt. Este informe se almacena en la carpeta de informes del proyecto al que está pegando.

NOTA: Sólo se pueden cortar y copiar puntos entre proyectos. Si las observaciones han sido usadas para posicionar puntos, entonces se copian las coordenadas derivadas. Si los puntos han sido derivados de las coordenadas GPS y las observaciones entonces son copiadas las coordenadas WGS-84. Esta copia de la coordenada  WGS-84 puede ser usada en las calibraciones de un local GPS en el nuevo proyecto.


Adición de atributos a un punto

 Visión de conjunto y más información

Para añadir atributos, debe configurar un proyecto con atributos.

1.	Seleccione el punto al que quiere añadir atributos. Para ello, utilice uno de los siguientes:

  el ratón

  el menú Seleccionar

2.	Abra la ventana Propiedades.

3.	En la ficha Atributos, haga clic en el icono de menú de página [image].

Aparece el menú de acceso directo.

4.	Haga clic en Insertar. Aparece la lista de códigos de característica disponibles.

5.	Seleccione el código de característica con atributos que desea añadir. Se muestran los atributos de la característica seleccionada.

6.	Introduzca valores para cada atributo.

Trimble Geomatics Office comprueba todos los valores que se Introducen. De esta forma se garantiza que el valor es válido con respecto a la biblioteca de características y atributos utilizada para configurar el proyecto con atributos.

7.	Repita los pasos anteriores con todos los otros códigos de característica con atributos que quiera añadir al punto.


Visualización de atributos

 Visión de conjunto y más información

1.	Seleccione el(los) punto(s).

Para realizar esto, utilice uno de los siguientes pasos:

  Utilice el ratón.

  Utilice el menú Seleccionar.

2.	Abra la ventana Propiedades.

3.	Seleccione la ficha Atributos.

Sólo puede verse un código de característica con atributos cada vez.

Para ver otro código de característica con atributos, utilice la lista desplegable.

NOTA: La ficha Atributos sólo se muestra si se ha especificado una biblioteca de características y atributos para el proyecto en el diálogo Propiedades proyecto / ficha Propiedades.


Edición de atributos

 Visión de conjunto y más información

1.	Haga clic en el atributo. Si este es de tipo menú, aparece una flecha a la derecha del campo.

2.	Haga clic en la flecha para visualizar la lista de opción de menú del atributo.

Todos los otros tipos de atributo requieren entrada desde el teclado.

NOTA: Cuando se edite información de atributo, Trimble Geomatics Office comprueba la definición de la biblioteca de características y atributos para verificar que se han introducido los valores correctos.


Inserción de líneas

 Visión de conjunto y más información

1.	Seleccione la vista del plano. Realice uno de los siguientes pasos:

  Seleccione Vista / Plano

  Haga clic en la herramienta Vista del plano.

  Presione Alt+2.

2.	Realice uno de los siguientes pasos:

  Seleccione Insertar / Líneas.

  Seleccione la herramienta Insertar línea.

Aparece el diálogo Insertar línea con la ficha Línea seleccionada.

3.	En el campo Desde punto, realice uno de los siguientes pasos:

  Utilice Rellenar campo para seleccionar el primer punto requerido para definir la línea.

  Introduzca el nombre para el primer punto requerido para definir la línea.

4.	En el campo Al punto, realice uno de los siguientes pasos:

  Utilice Rellenar campo para seleccionar el segundo punto requerido para definir la línea.

  Introduzca el nombre para el segundo punto requerido para definir la línea.

5.	En el campo Capa, realice uno de los siguientes pasos:

  Seleccione la capa a la que quiere añadir la línea.

  Introduzca un nuevo nombre de capa para crear una nueva capa.

6.	En el campo Estilo de línea, seleccione el estilo de línea que necesita para visualizar la misma.

7.	Para añadir la línea, realice uno de los siguientes pasos:

  Haga clic en Insertar.

  Presione Entrar.

El punto que se ha seleccionado en el campo Al punto aparece en el campo Desde punto. Usted puede seguir añadiendo líneas sin tener que volver a introducir el punto “de origen”.

La línea aparece en la ventana gráfica (siempre que la capa seleccionada para la línea tenga habilitada la propiedad Visible).

8.	Haga clic en Cerrar para dejar de insertar líneas.


Inserción de curvas

 Visión de conjunto y más información

1.	Seleccione la vista del plano. Realice uno de los siguientes pasos:

  Seleccione Vista / Plano

  Haga clic en la herramienta Vista del plano.

  Presione Alt+2.

2.	Seleccione Insertar / Curvas. Aparece el diálogo Insertar línea con la ficha Curva seleccionada.

3.	En el campo Desde punto, realice uno de los siguientes pasos:

  Utilice Rellenar campo y haga clic en los puntos correctos.

  Utilice el teclado para introducir el nombre del punto.

4.	En el campo Al punto, realice uno de los siguientes pasos:

  Utilice Rellenar campo y haga clic en los puntos correspondientes.

 Utilice el teclado para introducir el nombre del punto.

5.	En los campos Tangente entrada y Tangente salida, deje los valores como <Automático> para introducir automáticamente los valores de la tangente en función de los puntos utilizados para definir la curva. Usted puede introducir sus propios valores de tangente.

6.	En el campo Suavizamiento, introduzca un valor entre  0 y 1. El suavizamiento define la anchura que hay en la curva. Cuanto más alto sea el suavizamiento, mayor será la anchura de la curva.

7.	En el campo Capa, realice uno de los siguientes pasos:

  Seleccione la capa en la que quiere añadir la curva.

  Introduzca un nombre de capa nuevo para crear una nueva capa.

8.	En el campo Estilo de línea, seleccione el estilo de línea que se requiere para visualizar la curva.

9.	Para añadir la curva, realice uno de los siguientes pasos:

  Haga clic en Insertar.

  Presione Entrar.

La curva aparece en la ventana gráfica (siempre que la capa seleccionada para la curva tenga habilitada la propiedad Visible). Cada vez que añada una curva de un punto que es utilizado en otra curva, Trimble Geomatics Office recalcula la curva existente para asegurar que la curva visualizada sea suave.

10.	Haga clic en Cerrar para dejar de insertar curvas.


Inserción de arcos

 Visión de conjunto y más información

1.	Seleccione la vista del plano. Realice uno de los siguientes pasos:

  Seleccione Vista / Plano.

  Haga clic en la herramienta Vista del plano.

 Seleccione Alt+2.

2.	Seleccione Insertar / Arcos. Aparece el diálogo Insertar línea con la ficha Arco seleccionada.

3.	En el campo Desde punto, realice uno de los siguientes pasos:

  Utilice Rellenar campo y haga clic en el punto que corresponda.

  Utilice el teclado para introducir el nombre del punto.

4.	En el campo Al punto, realice uno de los siguientes pasos:

  Utilice Rellenar campo y haga clic en el punto que corresponda.

 Utilice el teclado para introducir el nombre del punto.

5.	En el campo Punto central para utilizar un punto existente como el centro del arco, realice uno de los siguientes pasos:

  Introduzca un nombre de punto existente.

  Utilice Rellenar campo para seleccionar un punto existente.

Las coordenadas del punto se copian en los campos Norte centro y Este centro.

6.	En los campos Norte centro y Este centro, haga clic en un lugar de la ventana gráfica para usar las coordenadas como el centro del arco. Las coordenadas se copian en estos campos.

Se utiliza el punto central si se introducen las coordenadas centrales y el punto central.

7.	En el campo Arco pequeño, seleccione la opción Falso si quiere crear un arco grande. De lo contrario, seleccione Verdadero. Siempre hay dos arcos posibles entre dos puntos, que juntos definen un círculo. Esta configuración define el arco que quiere dibujar.

8.	En el campo Capa, realice uno de los siguientes pasos:

  Seleccione la capa en la que quiere añadir el arco.

  Introduzca un nuevo nombre de capa para crear una capa nueva.

9.	En el campo Estilo de línea, seleccione el estilo de línea que se necesita para visualizar el arco.

10.	Para añadir la curva, realice uno de los siguientes pasos:

  Haga clic en Insertar.

  Presione Entrar.

El arco aparece en la ventana gráfica (siempre que la capa seleccionada para el arco tenga habilitada la propiedad Visible).

11.	Haga clic en Cerrar para dejar de insertar arcos.


Inserción de texto

 Visión de conjunto y más información

1.	Seleccione la vista del plano. Realice uno de los siguientes pasos:

  Seleccione Vista / Plano.

  Haga clic en la herramienta Vista del plano.

  Presione Alt+2.

2.	Realice uno de los siguientes pasos:

  Seleccione Insertar / Texto.

  Haga clic en la herramienta Insertar texto.

Aparece el diálogo Insertar texto.

3.	En el campo Expresión texto, introduzca el texto que quiere que aparezca. Para utilizar códigos de campo (por ejemplo, el título del proyecto), haga clic con el botón derecho en el menú de acceso directo y seleccione Campos.

4.	En el campo Norte, introduzca el valor norte para la ubicación del texto.

Alternativamente, utilice Rellenar campo haciendo clic en una ubicación de la ventana gráfica.

5.	En el campo Este, introduzca el valor este para la ubicación del texto.

Alternativamente, utilice Rellenar campo haciendo clic en una ubicación de la ventana gráfica.

6.	En el campo Orientación, introduzca la orientación para la entidad de texto. Si no especifica ninguna orientación, el texto se visualiza horizontalmente en la ventana.

7.	En el campo tipo de ancla, especifique el lugar en que desea ubicar el texto con respecto a los valores Norte y Este y seleccione un valor de la lista.

8.	En el campo Capa, seleccione la capa de la lista a la que quiere añadir texto. Para introducir texto en una capa nueva, teclee un nombre nuevo.

9.	En el campo Estilo texto, seleccione de la lista el estilo de texto para la entidad de texto. Si requiere el estilo de texto configurado por defecto para la capa a la que va a añadir texto, seleccione la opción <Por capa>.

10.	Haga clic en Insertar para añadir el texto a la base de datos y mantener el diálogo abierto para añadir más texto.

11.	Haga clic en Cerrar para dejar de insertar texto.


Creación de una nueva plantilla de proyecto

 Visión de conjunto y más información

1.	Realice uno de los siguientes pasos:

  Haga clic en la herramienta Nuevo.

  Seleccione Archivo  / Nuevo proyecto.

Aparece el diálogo Nuevo proyecto.

2.	En el campo Nuevo grupo, seleccione la opción Plantilla. La carpeta del proyecto en el grupo Detalles cambia a la carpeta de la plantilla por defecto.

3.	En el campo Nombre, introduzca un nombre para la plantilla del proyecto.

4.	En el campo Plantilla, seleccione una plantilla de la lista y haga clic en Aceptar.

Aparece el diálogo Propiedades proyecto.

5.	Seleccione las propiedades por defecto que quiere que tengan todos los proyectos que utilicen estas plantillas y haga clic en Aceptar.

Aparece un mensaje. Para continuar trabajando con la plantilla, haga clic en Sí. Para cerrar la plantilla del proyecto, haga clic en No.

6.	Si selecciona Sí, podrá continuar trabajando con la plantilla del proyecto. Para dejar de trabajar con ella, seleccione Archivo / Cerrar.

7.	Cuando cree un nuevo proyecto, verá la nueva plantilla en la lista de plantillas del diálogo Nuevo proyecto.


Creación de estilos de punto

 Visión de conjunto y más información

1.	En la vista del plano, seleccione Editar / Estilos. Aparece el diálogo Estilos CAD.

2.	En la ficha Estilos de punto, haga clic en Nuevo. Aparece el diálogo Crear estilo de punto.

3.	Complete el diálogo Crear estilo de punto.

4.	Haga clic en Aceptar.

El estilo de punto se añade a la base de datos. Aparece en el diálogo Estilos CAD − Estilos de punto.


Apertura de la ventana Propiedades

 Visión de conjunto y más información

Realice uno de los siguientes pasos:

  Seleccione Editar / Propiedades.

  Haga clic en la herramienta Editar propiedades [image].

  Elija Propiedades del menú de acceso directo.

  Haga doble clic en una entidad gráfica.

  Presione Alt + Entrar.


Exportación de un archivo de diccionario de datos (.ddf) a Trimble Survey Controller

 Visión de conjunto y más información

NOTA: Usted sólo puede transferir archivos .ddf a un dispositivo que ejecute Trimble Survey Controller versión 7.00 ó posterior.

1.	Seleccione Archivo / Exportar. Aparece el diálogo Exportar

2.	En la ficha del levantamiento, seleccione la opción Archivo de diccionario de datos al Survey Controller (*.ddf) y haga clic en Aceptar. Aparece el diálogo Seleccionar.

3.	Seleccione el archivo que quiere transferir a Trimble Survey Controller y haga clic en Abrir. Aparece el diálogo Guardar.

4.	Seleccione un dispositivo de Survey Controller y haga clic en Abrir. Aparece el diálogo Conectando.

Una vez realizada la conexión con el dispositivo, aparece Memoria principal (C:) en el cuadro. Si tiene una tarjeta PC insertada en el dispositivo, también se muestra Tarjeta PC (A:).

NOTA: Si el dispositivo no tiene una tarjeta PC, este diálogo no es disponible.

5.	Realice uno de los siguientes pasos:

  	Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  	Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

6.	Haga clic en Abrir. Se lee la memoria principal o la tarjeta PC. Se muestran los archivos de diccionario de datos existentes.

7.	En el campo Nombre de archivo, aparece el nombre interno del archivo .ddf seleccionado para exportar. Este es el nombre que verá en Trimble Survey Controller.

8.	Si es necesario edite el nombre.

9.	Haga clic en Guardar. Aparece el diálogo Cargando y la barra de progreso muestra el progreso de la transferencia.

Cuando ésta se haya completado, desaparece el diálogo Cargando y vuelve a mostrarse la ventana gráfica. Ahora puede utilizar el archivo .ddf con Trimble Survey Controller.

NOTA: Si está transfiriendo datos de o a Trimble Survey Controller versión 7.60, utilice el formato de archivo .dc versión 7.50.


Arrastre y colocación de un archivo en un proyecto

 Visión de conjunto y más información

Para arrastrar y colocar un archivo en un proyecto:

1.	Abra el proyecto de Trimble Geomatics Office al que quiere transferir los archivos.

2.	Abra el Explorador de Microsoft Windows.

Para obtener más información, véase la documentación del sistema operativo de Microsoft Windows.

3.	Localice la carpeta que contiene los archivos a importar.

4.	Haga clic con el botón derecho en los archivos a importar.

5.	Arrastre los archivos a la ventana gráfica de Trimble Geomatics Office.

6.	Libere el botón derecho del ratón para ver el menú de acceso directo.

7.	Seleccione la opción de archivo correspondiente.

8.	Haga clic en el botón izquierdo. Se importarán los archivos.

Para obtener información sobre las acciones posibles que se realizan durante la importación, véase Importar − Visión de conjunto. Los archivos se almacenan en la carpeta Archivos de datos\Archivos Trimble del proyecto.


Selección de puntos por nombre

1.	Elija Seleccionar / Puntos. Aparece el diálogo Seleccionar puntos.

2.	Seleccione la ficha General.

3.	En el campo de emparejamiento de nombres, introduzca el nombre del punto que quiere seleccionar. Asimismo puede usar rangos y caracteres de comodín para seleccionar varios puntos.

4.	Haga clic en Aceptar. Se emparejan el(los) punto(s) que coincida(n) con el nombre indicado. La barra de estado muestra todos los puntos seleccionados.

NOTA: A no ser que se seleccione la casilla de verificación Añadir a selección actual, en el conjunto de selección no se retiene ninguna entidad que se haya seleccionado antes de utilizar el diálogo Seleccionar punto.


Selección de puntos por su calidad

1.	Elija Seleccionar / Puntos. Aparece el diálogo Seleccionar puntos.

2.	Seleccione la ficha General.

3.	En el campo Con calidad(es) de punto, seleccione el componente y la combinación de cantidades que quiere seleccionar. Puede seleccionar varias entradas múltiples de la lista.

4.	Haga clic en Aceptar.

Se elige(n) el(los) punto(s) que coincida(n) con su selección. La barra de estado muestra los puntos seleccionados.

NOTA: A no ser que se seleccione la casilla de verificación Añadir a selección actual, en el conjunto de selección no se retiene ninguna entidad que se haya seleccionado antes de utilizar el diálogo Seleccionar punto.


Selección de observaciones de un punto seleccionado

1.	En la vista del levantamiento, elija Seleccionar / Observaciones. Aparece el diálogo Seleccionar observaciones.

2.	En el campo Desde punto, introduzca el nombre del punto, o introduzca un rango para utilizar puntos múltiples de la selección. También puede usar Rellenar campo y comodines.

3.	Haga clic en Aceptar.

Se elige(n) la(s) observación(es) que coincida(n) con su selección. La barra de estado muestra las observaciones seleccionadas.

NOTA: A no ser que se seleccione la casilla de verificación Añadir a selección actual, en el conjunto de selección no se retiene ninguna entidad que se haya seleccionado antes de utilizar el diálogo Seleccionar punto.


Inhabilitación de observaciones

1.	Desde la vista de levantamiento, seleccione una observación.

2.	Realice uno de los siguientes pasos:

  Abra la Ventana Propiedades. Haga clic en el icono de Resumen [image] y seleccione la opción Inhabilitada del campo Estado.

  Seleccione Editar / Inhabilitar/Habilitar observación.

NOTA: La inhabilitación de observaciones requiere un recálculo para actualizar la información topográfica. Cuando usted mueve un punto, todas las observaciones se inhabilitan automáticamente.


Importación de trabajos de Trimble Survey Controller a Trimble Geomatics Office

1.	Realice uno de los siguientes pasos:

  Seleccione Archivo / Importar.

  Haga clic en la herramienta Importar.

2.	En la ficha del levantamiento, seleccione la opción dispositivos topográficos. 	Aparece el diálogo Abrir de Transferencia de datos.

3.	Seleccione un dispositivo Trimble Survey Controller.

4.	Haga clic en Abrir. Aparece el diálogo Conectando. Una vez realizada la conexión, el diálogo Abrir se actualiza para visualizar el dispositivo seleccionado.

5.	Seleccione los archivos que quiere transferir de una de las siguientes opciones:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal del software Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo no tiene una tarjeta PC, este diálogo no está disponible.

6. 	Haga clic en Abrir. Aparece el diálogo Recibiendo y la barra de progreso visualiza el progreso de la transferencia. Cuando ésta se haya completado, desaparece el diálogo Recibiendo y cesa la conexión al dispositivo.


Ocultación o visualización de barras de herramientas

1.	Realice uno de los siguientes pasos:

  Haga clic con el botón derecho en la zona de la barra de herramientas. Aparece un menú de acceso directo.

  Seleccione Ver / Barras de herramientas. Se muestra un menú.

Aparece la lista de barras de herramientas disponibles. Cada barra de herramientas que esté visualizándose en ese momento tiene a su lado una marca de verificación.

2.	Seleccione la barra de herramientas que requiera. La barra de herramientas desaparece de (o vuelve a mostrarse) la ventana gráfica del software Trimble Geomatics Office.

3.	Para volver a ver la barra de herramientas, repita los pasos anteriormente descritos.


Transferencia de detalles de antena a Trimble Survey Controller

1.	Seleccione Archivo  / Exportar. Aparece el diálogo Exportar.

2.	En la ficha del levantamiento, seleccione la opción Detalles antena al Survey Controller. Aparece el diálogo Guardar como de Transferencia de datos.

3.	Seleccione un dispositivo Trimble Survey Controller y haga clic en Abrir.

Aparece el diálogo Conectando. Una vez realizada la conexión, aparece el diálogo Guardar.

4.	Realice uno de los siguientes pasos:

  Seleccione la opción de memoria principal (C:) para almacenar la biblioteca en la memoria principal de Trimble Survey Controller.

  Seleccione la opción Tarjeta PC (A:) si tiene una tarjeta de PC insertada y quiere almacenar la biblioteca en la misma.

NOTA: Si el dispositivo de datos no tiene una tarjeta PC, este diálogo no está disponible.

5.	Haga clic en Abrir. Se lee el directorio que ha seleccionado. Se muestran todos los archivos de Survey Controller que hay en el directorio. El nombre del proyecto de Trimble Geomatics Office aparece en el campo Nombre de archivo. Este es el nombre del trabajo de Trimble Survey Controller que va a exportarse a Trimble Survey Controller. Si es necesario este nombre puede editarse.

6. 	Haga clic en Guardar. Aparece el diálogo Cargando y la barra de progreso muestra el progreso de la transferencia.

El archivo Antenna.ini (localizado en la carpeta \Archivos de programa\Archivos comunes \Trimble\Config) se transfiere a Trimble Survey Controller.

Una vez completada la transferencia, el diálogo Cargando desaparece y cesa la conexión al dispositivo.


Exportación de notas de atributo

1.	Seleccione Archivo  / Exportar. Aparece el diálogo Exportar.

2.	En la ficha CAD / ASCII, seleccione la opción Notas de atributos del archivo DC (Survey Controller V4) y haga clic en Aceptar. Aparece el diálogo Guardar como.

3.	Introduzca el nombre del archivo en el campo Nombre de archivo.

4.	Haga clic en Guardar.


Visualización de información sobre Trimble Geomatics Office

1.	Desde el menú de ayuda, seleccione el comando Acerca del software Trimble Geomatics Office. Aparece el diálogo Acerca del software Trimble Geomatics Office.

2.	Haga clic en Aceptar.


Para invertir el sentido de una línea base
Invertir el sentido de una observación

1.	Desde la vista de levantamiento, seleccione la observación que quiere aplicar en sentido opuesto.

2.	Seleccione Editar / Flujo de observación  invertido.

3.	Se invierte el sentido de la observación. Cuando ésta se aplique en sentido opuesto, es probable que se modifiquen las coordenadas y calidades de punto calculadas.

PRECAUCION: Si el punto del que quiere que fluya la observación no tiene una posición conocida (tal como la de un punto RTK observado), no se aplicará la observación.

NOTA: No se pueden invertir las observaciones terrestres colectadas usando una estación total.


Visualización de errores y advertencias

1.	Realice uno de los siguientes pasos:

  Desde la vista de levantamiento, haga doble clic en un punto o en una observación que tenga un indicador de advertencia.

  Haga doble clic en el icono del indicador en la barra de estado para seleccionar todos los puntos y observaciones con indicadores de advertencia.

Aparece la Ventana  de propiedades con la(s) entidad/entidades seleccionada(s).

2.	Desde la Ventana Propiedades, seleccione el punto u observación que quiere ver (si tiene varias entidades en la selección).

3.	Para ver la página de advertencia, haga clic en el botón del menú Advertencia [image].

  Seleccione la opción Advertencia desde el menú de Página detallado.

El mensaje visualiza el tipo de error que se ha producido.

4.	Para ver detalles adicionales de un punto, seleccione la herramienta Informe Punto de derivación [image].

Aparece el informe de derivación de puntos.


Transferencia de archivos de la cuadrícula nacional del Reino Unido a Trimble Survey Controller

NOTA: Usted sólo puede transferir archivos .pgf a Trimble Survey Controller versión 7.50 ó posterior:

1.	Inicie la utilidad Transferencia de datos de Trimble. Realice uno de los siguientes pasos:

  Seleccione Utilidades / Transferencia de datos cuando no haya ningún proyecto abierto.

 Seleccione Inicio / Programas / Trimble / Utilidades de Trimble / Transferencia de datos en cualquier momento.

Aparece el diálogo Transferencia de datos.

2.	Seleccione la ficha Enviar.

3.	Desde la lista de dispositivos, seleccione el de Survey Controller al que quiere exportar los archivos. La utilidad Transferencia de datos de Trimble intenta conectar con el dispositivo seleccionado. Cuando se logra la conexión, el cable del icono que está en el extremo derecho superior cambia para mostrar que el dispositivo está conectado, y en la línea de estado bajo el icono superior derecho se lee ‘Conectado a <dispositivo>’, donde <dispositivo> representa el tipo de dispositivo (tal como un Survey Controller).

4.	Haga clic en Añadir. Aparece el diálogo Abrir. La lista Buscar carpeta muestra la última carpeta de la que se seleccionaron archivos para el dispositivo, y la lista principal visualiza las carpetas y sus archivos correspondientes.

5.	Desde la lista Mostrar archivos de tipo, seleccione la opción Archivos de cuadrícula nacional del Reino Unido (*.PGF).

6.	Utilice la lista de Buscar carpeta y el cuadro de lista para cambiar la unidad y carpeta seleccionadas y elija los archivos que quiere transferir.

Para transferir los archivos .pgf existentes suministrados por Trimble Geomatics Office seleccione el archivo Norte.pgf o Este.pgf de la carpeta Archivos de programa\Archivos comunes\Trimble\Geodata.

7.	Estos archivos pueden enviarse a la memoria principal o a una tarjeta PC (si es que la tiene instalada). Seleccione el destino desde la lista Destino.

8.	Verifique que el campo Formato de Archivo se haya especificado al archivo de trabajo v7.50. De ser necesario, seleccione esta opción de la lista.

9.	Haga clic en Seleccionar.

Se cierra el diálogo Abrir y vuelve a mostrarse el diálogo Transferencia de datos. Los archivos seleccionados aparecen en la lista Archivos a enviar.

10.	Haga clic en Transferir.

Aparece el diálogo Convirtiendo mientras los archivos se convierten del formato de archivo del dispositivo. Terminada la conversión de archivos, se muestra el diálogo Enviando, que indica el progreso de la exportación de los archivos seleccionados.

Una vez completada la transferencia, se muestra el diálogo Transferencia de datos completada con los resultados de esta operación.

NOTA: Si está transfiriendo datos de o a Trimble Survey Controller versión 7.60, utilice el formato de archivo .dc versión 7.50.


Calibración utilizando coordenadas de calibración guardadas y coordenadas ajustadas (derivadas del módulo Ajuste de red)

1.	Una vez completado un ajuste mínimo de puntos de control, y establecidas las coordenadas WGS-84 para todos los puntos del ajuste de red, guarde las coordenadas, para utilizar como coordenadas GPS observadas, en la calibración local. Las coordenadas de calibración están constituidas por las latitudes, longitudes y alturas elipsoidales WGS-84.

Para guardar las coordenadas de calibración:

  Seleccione Ajuste / Coordenadas de calibración / Guardar.

Aparece el diálogo Guardar coordenadas de calibración.

NOTA: Este comando sólo está disponible cuando se seleccione WGS-84 como el datum de ajuste y sólo han sido incluidas las observaciones GPS en el ajuste previo.

NOTA: Si los parámetros de transformación de ajuste son creados durante un ajuste, entonces éstos se descartan cuando lleve a cabo una calibración local GPS. Trimble Geomatics Office sólo le permitirá el uno o el otro.

2.	Seleccione uno de los siguientes:

 opción Crear coordenadas de puntos existentes

 opción Crear coordenadas de puntos nuevos con sufijo.

3.	Haga clic en Aceptar. Las coordenadas de calibración se guardan.

NOTA: Se crea una coordenada WGS-84 para cada punto en el ajuste. Se puede visualizar esta coordenada en la Ventana Propiedades. Esta coordenada no puede ser editada.

4.	Realice un ajuste limitado en el datum del proyecto (para ello, consulte los temas de ayuda pertinentes del módulo Ajuste de red). Los valores ajustados se guardan en la base de datos.

NOTA: Se crea una coordenada de cuadrícula ajustada para cada punto no limitado en el ajuste. Esta coordenada puede ser visualizada en la Ventana Propiedades.

5.	Realice una calibración local GPS utilizando los pares de puntos derivados del ajuste de red. Para ello, seleccione Medición / Calibración local GPS. Aparece el diálogo Calibración local GPS.

6.	En el grupo Componentes calibración, seleccione los parámetros de calibración que quiere calcular.

7.	Haga clic en Lista de puntos. Aparece el diálogo Lista de puntos.

8.	Utilice el diálogo Lista de puntos para seleccionar los pares de puntos (punto GPS y punto de cuadrícula) para la calibración. Lleve a cabo una de las siguientes acciones:

  Utilice Rellenar campo o introduzca el nombre de la coordenada de calibración guardada en el campo Punto GPS.

  Utilice Rellenar campo o introduzca el nombre de la coordenada ajustada que corresponda en el campo Punto de la cuadrícula.

Si la coordenada del punto fijo mínimo se guardó en el mismo punto, el campo  de punto de cuadrícula se rellena automáticamente. Cuando se introduzca el punto GPS, los valores mostrados son los de las coordenadas de calibración guardadas. Cuando se introduzca el punto de la cuadrícula, se seleccionan los valores ajustados.

9.	Repita el paso anterior para seleccionar todos los pares de punto que necesita en la calibración.

10.	Cuando se hayan seleccionado todos los pares de puntos, haga clic en Cerrar para regresar al diálogo Calibración local GPS.

11.	Haga clic en Calcular para calcular los parámetros de calibración. Los resultados de la calibración aparecen en el grupo Resumen de la calibración.

12.	Haga clic en Aceptar para aplicar la calibración al proyecto. El sistema de coordenadas se actualiza con los parámetros de calibración. Ahora puede transferir la calibración a Trimble Survey Controller.


Informe y exportación de eventos

Se puede definir un informe o exportar un formato para registrar la hora en que un evento es registrado por el receptor.

Para informar los eventos, cree una informe de base de datos personalizada.

1.	Seleccione puntos con los registros de eventos en Trimble Geomatics Office.

Para realizar esto:

a. Seleccione Seleccionar/ Puntos. Aparece el diálogo Seleccionar puntos.

b. Seleccione la ficha GPS.

c. De la lista Método de campo, seleccione Eventos.

d. Haga clic en Aceptar.

Todos los puntos con registros de eventos son seleccionados.

2.	Seleccione Informes / Informes Adicionales. Aparece el diálogo Informes adicionales.

3.	Realice unos de los siguientes:

  Haga clic en Editar para modificar en formato de informe existente.

  Haga clic en Nuevo para crear un nuevo formato de informe.

Aparece el diálogo Definir formato de Informe.

4.	En el cuerpo del campo de formato haga clic en el botón derecho para acceder  al menú directo y luego seleccione Avanzado / Subregistros / Punto Obs / Hora.

Para exportar eventos para definiciones de exportación personalizada:

1.	Seleccione Archivo/Exportar. El cuadro de diálogo Exportar.

2.	En la ficha Personalizar, realice uno de los siguientes:

  Haga clic en Editar formato para modificar un formato existente.

  haga clic en Formato nuevo para crear un nuevo formato de informe.

Aparece el diálogo Definir formato de exportación ASCII.

3.	En el cuerpo del campo de formato haga clic en el botón derecho para acceder  al menú directo y luego seleccione Avanzado / Subregistros / Punto Obs / Hora.


Presentación del formato de hora

El formato de presentación típica de la hora para eventos es el siguiente: 09:12:55 8 Feb 2000

Para cambiar esta presentación , haga clic en el botón derecho junto al código de campo para acceder al menú directo y luego seleccione Avanzado / Más / Presentación de formatos. Seleccione una muestra de presentación de la hora o cree la suya propia. Para más información consulte Presentación del Formato de la Hora.

NOTA: Para mostrar la hora de los eventos más cercanos hasta los milisegundos, añada la siguiente presentación del formato de la hora, <H:mm:ss.nnn>,en donde nnn es el número de décimas de segundos. Por ejemplo, [Puntos Obs.Hora:<H:mm:ss.nnn>]. Para aumentar la precisión de la hora, aumente el número de décimas de segundos. Por ejemplo, nnnn muestra las primeras 4 décimas de segundo.


Copia de datos de observación entre proyectos

Para copiar datos de observación entre proyectos de Trimble Geomatics Office, utilice el Trimble Data Exchange Format. No se puede usar la función copiar y pegar.

Para copiar datos de observación entre proyectos:

1.	En el proyecto actual en Trimble Geomatics Office, seleccione los datos de observación que desea copiar.

2.	Exporte datos de su proyecto actual usando el Trimble Data Exchange Format:

a.	Seleccione Archivo / Exportar. Aparece el diálogo Exportar.

b.	En la Ficha de levantamiento, seleccione el Trimble Data Exchange Format y haga clic en Aceptar. Aparece el diálogo Guardar como.

c.	Guarde el archivo.

3.	Cree un nuevo proyecto en Trimble Geomatics Office.

4.	Importe los datos de observación en el nuevo proyecto utilizando el Trimble Data Exchange Format:

a.	Seleccione Archivo / Importar. Aparece el diálogo Importar.

b.	En la Ficha de levantamiento, seleccione el Trimble Data Exchange Format y haga clic en Aceptar. Aparece el diálogo Abrir.

c.	Seleccione el archivo.

Los datos de observación son importados en el proyecto Trimble Geomatics Office.

NOTA: Si desea crear una copia de todas las observaciones y puntos en el proyecto, cree una copia del proyecto de Trimble Geomatics Office.


Importación manual de datos terrestres

Para importar manualmente datos terrestres a Trimble Geomatics Office, utilice el formato Fieldbook de Softdesk. Este formato es desarrollado por Autodesk.

Cree un archivo en el formato Fieldbook de Softdesk, usando datos terrestres:

  Importe el archivo a Trimble Geomatics Office:

a.	Seleccione Archivo / Importar. Aparece el diálogo Importar.

b.	En la ficha de levantamiento, seleccione los archivos de registro de datos de otros. Aparece el diálogo Abrir.

c.	Seleccione el archivo que quiera importar.

d.	De los archivos de Tipo de Campo, seleccione los archivos de formato del libro de campo Autodesk FBK (*.FBK) y haga clic en Aceptar.

El archivo es importado al proyecto Trimble Geomatics Office.

NOTA: El formato Fieldbook de Autodesk Softdesk se describe a continuación. Este formato ha sido tomado de los archivos de ayuda de AutoCAD Land Development Desktop.

Considere lo siguiente:

  Cualquier línea en el formato que no comience con uno de los comandos reconocidos es ignorado.

  Los artículos incluidos entre paréntesis () son opcionales.

  Trimble Geomatics Office requiere el uso de un número de punto.

  La descripción de punto (descripc) debe ser incluida entre doble comillas (") ya que ésta es la parte de una definición del archivo con formato de Fieldbook. Esto significa que se pueden usar puntos en la descripción de puntos.


Comandos de creación de puntos

AD (punto) [ángulo] [distancia] (descripc)

AD [VA] (punto) [ángulo] [distancia] [ángulo vert] (descripc)

AD [VD] (punto) [ángulo] [distancia] [distancia vert] (descripc)

BD (punto) [rumbo] [cuadrante] [distancia] (descripc)

BD [VA] (punto) [rumbo] [cuadrante] [distancia] [ángulo vert] (descripc)

BD [VA] (punto) [rumbo] [cuadrante] [distancia] [vert dist] (descripc)

DD (punto) [ángulo] [distancia] [ángulo vert] (descripc)

DD [VA] (punto) [ángulo] [distancia] [ángulo vert] (descripc)

DD [VD] (punto) [ángulo] [distancia] [distancia vert] (descripc)

F1/F2 (punto) [ángulo] [distancia] (descripc)

F1/F2 [VA] (punto) [ángulo] [distancia] [ángulo vert] (descripc)

F1/F2 [VD] (punto) [ángulo] [distancia] [distancia vert] (descripc)

NE (punto) [Norte] [Este] (descripc)

NEZ (punto) [Norte] [Este] (elev) (descripc)

NE SS (punto) [Norte] [Este] (elev) (descripc)

PRISM [altura]

PT OFFSET (punto) [offset] (adelante)

STADIA (punto) [ángulo] [distancia] [rod] (ángulo vert) (descripc)

ZD (punto) [acimut] [distancia] (descripc)

ZD [VA] (punto) [acimut] [distancia] [ángulo vert] (descripc)

ZD [VD] (punto) [acimut] [distancia] [distancia vert] (descripc)


Comandos de ubicación de puntos

AZ [punto 1] [punto 2] [acimut]

BS [punto] (orientación)

STN [punto] (altura enst.) (descripc)


Comandos de corrección de equipo

ÁNGULOS [DERECHO, IZQUIERDO] [ZENITH, NADIR, HORIZ]

ATMOS [ON, OFF]

CR [ON, OFF]

EDM OFFSET  [offset]

HORIZ ÁNGULO [DERECHO, IZQUIERDO]

PRESS [presión] [INCH, MBAR, MM]

SF [factor]

PRISM CONSTANT  [constante]

PRISM OFFSET  [offset]

TEMP [temperatura] [F, C, K]

UNIDADES [METRO, PIE] [DMS, DECDEG, GRAD, MILS, RADIANES]

ÁNGULO VERT [ZENITH, NADIR, HORIZ]


Adición de coordenadas en la ventana Propiedades

Trimble Geomatics Office le permite añadir coordenadas para un punto en la Ventana Propiedades, usando la herramienta [image] Añadir coordenadas, en el Sumario.

Para realizar esto:

1.	Haga doble clic en el punto en el proyecto. Aparece la Ventana Propiedades.

2.	En el Sumario, seleccione [image] y luego seleccione el tipo de coordenada  que necesita añadir, ya sea cuadrícula, local ó WGS 84.

En la estructura de árbol de la Ventana Propiedades, aparece una nueva coordenada bajo el punto seleccionado. Un prefijo es añadido al nombre para denotar si la coordenada es una cuadrícula (G), local (L), ó coordenada WGS-84 (W). El Sumario para la nueva coordenada muestra todos los campos como nulos.

NOTA: Sólo se puede introducir una coordenada WGS-84 y una cuadrícula ó  coordenada local para cada punto. Cuando añada una coordenada WGS-84, esta opción se vuelve no disponible en la lista Añadir coordenada. Si un punto ya tiene una coordenada WGS-84 y una cuadrícula ó coordenada local, el botón Añadir Coordenada se vuelve no disponible.

3.	Para poblar el Norte, Este, Elevación, y campos de altura para la coordenada, haga  clic en cada campo y luego haga clic en el botón Insertar valor actual [image]. Cada campo es relleno con la posición y calidad actual del punto. Se puede editar esta información si es necesario.

SUGERENCIA: Sólo añada una coordenada cuando esté seguro que quiere utilizar esta coordenada en lugar de las observaciones. Los recálculos utilizan coordenadas insertadas en preferencia a las observaciones de la misma calidad. Esto asegura que un punto de diseño es usado en preferencia a una observación replanteada.

NOTA: Trimble Geomatics puede generar coordenadas adicionales y almacenadas para un punto. Estas coordenadas pueden incluir:

  Coordenadas derivadas de un ajuste

  WGS-84 Coordenadas WGS-84 guardadas para calibración


Edición de coordenadas en la ventana Propiedades

 Visión de conjunto y más información

Trimble Geomatics Office le permite editar coordenadas para un punto en la Ventana Propiedades.

Para realizar esto:

1.	Haga doble-clic en el punto en el proyecto. Aparece la Ventana Propiedades

2.	En  la estructura de árbol de la Ventana Propiedades, expanda la estructura de árbol para el punto  y seleccione la coordenada introducida  (WGS-84 ó cuadrícula/local) que desee editar.

3.	Edite  los componentes de la coordenada y calidad de la coordenada.

NOTA: Para que se pueda editar el campo de la coordenada, la configuración ver coordenada y la configuración tipo de coordenada debe ser la misma.

4.	Después de editar la coordenada, seleccione Levantamiento / Recalcular para llevar a cabo un recálculo.

Para más información acerca de añadir y editar coordenadas en la Ventana Propiedades, refiérase al tema Ventana Propiedades − Coordenadas.


Importación de archivos de nivel digital

El diálogo Importar nivel digital  aparece cuando importa  archivos de nivel digital (*.dat, *.raw) o descarga archivos con un nivel digital DiNi (utilizando dispositivos topográficos). Para ello:

1.	Seleccione Archivo / Importar. Aparece el diálogo Importar.

2.	En la ficha de Levantamiento, seleccione los archivos Nivel Digital (*.dat, *.raw) y haga clic en Aceptar. Aparece el diálogo Abrir.

3.	Seleccione el archivo Nivel Digital. Aparece el diálogo Importar nivel digital.

4.	En el diálogo Importar nivel digital, defina los puntos de estación, seleccionando la casilla de verificación en la columna Puntos de estación.

Los incrementos de elevación son calculadas entre puntos de estación. Cuando  se importan puntos de estación, éstos son mezclados con otros puntos con el mismo nombre. Asegúrese de que los nombres de los puntos sean únicos. Se puede editar los nombres de los puntos  en el diálogo Importar Nivel Digital.

NOTA: Los puntos que no estén definidos como puntos de estación no serán importados.

5. 	En el diálogo Importar nivel digital, introduzca una elevación para los puntos de inicio. Esta  elevación es usada para calcular elevaciones para otros puntos. Para editar las elevaciones de punto de inicio, haga clic en cualquier punto en el bucle. La elevación del punto de inicio para el bucle se muestra en el grupo Elevación. En el grupo Elevación, edite la elevación y calidad y haga clic en Enter. La elevación será calculada para todos los puntos de estación. Utilice estas elevaciones calculadas para compararlas con valores conocidos y validar datos.

NOTA: Las elevaciones con el símbolo de elevación son las únicas elevaciones importadas. El resto de los puntos de estación tendrá incrementos de elevación importados. Sus elevaciones serán calculadas durante el recálculo.

SUGERENCIA: Cualquier cambio que realice en el diálogo Importar nivel digital afecta sólo a los datos que son importados. Los cambios no afectan el archivo Nivel Digital(*.dat, *.raw).

6.	Haga clic en Aceptar. El archivo Nivel Digital es importado.

NOTA: Las observaciones que son importadas pueden no tener coordenadas horizontales, y pueden no aparecer en la ventana gráfica. Para ver los datos de nivel en la Ventana Propiedades, seleccione las observaciones de nivel  usando una de las herramientas  de selección y luego abra la Ventana Propiedades. Para realizar esto, efectúe uno de los siguientes pasos:

  Seleccione Editar / Propiedades

  Seleccione la herramienta Ventana Propiedades [image] en la barra de herramientas.

SUGERENCIA: Cuando colecte datos de nivel digital, Trimble recomienda almacenar los puntos que quiera importar a Trimble Geomatics Office con un sufijo o prefijo único.  Por ejemplo, almacene todos los puntos que desee utilizar como puntos de estación con el prefijo STN. Esto facilita la selección de puntos usando el botón  Seleccionar según Filtro en el diálogo Importar nivel digital.


Visualización de un mapa de fondo en Trimble Geomatics Office

Más información

 Visión de conjunto y más información

Para visualizar un mapa de fondo en Trimble Geomatics Office:

1.	Seleccione Ver / Opciones. Aparece el diálogo Ver Opciones..

2.	En la ficha Mapa de Fondo, haga clic en Añadir. Aparece el diálogo Añadir.

3.	Seleccione el archivo Mapa de Fondo y haga clic en  Aceptar.

NOTA: Trimble Geomatics Office puede mostrar archivos de fondo en la ventana de gráficos. Se puede importar los archivos Drawing Exchange Format (.dxf), Bitmap de Windows (.bmp) o Tagged Image File Format (.tif) para visualizar. Los archivos Bitmap de Windows (.bmp) y Tagged Image File Format (.tif) deben ser georeferenciados con el fin de ser visualizados correctamente. El formato de archivo de ESRI World es utilizado para georeferenciar archivos de fondo. Estos archivos deben estar en la misma carpeta que los correspondientes archivos de fondo.

El archivo de mapa de fondo aparece en Trimble Geomatics Office.

Para más información acerca del uso de mapas de fondo en Trimble Geomatics Office, refiérase a las Opciones Ver − Mapa de Fondo.


Visualización de líneas de cuadrícula en Trimble Geomatics Office

1.	Seleccione Ver / Opciones. Aparece el diálogo Ver Opciones.

2.	En la ficha líneas de cuadrícula, seleccione la casilla Mostrar líneas de cuadrícula.  Las opciones en este grupo se vuelven disponibles.

3.	Seleccione el Número fijo de líneas de cuadrícula u Opciones de intervalo de cuadrícula e    introduzca los valores apropiados en cada campo.

4.	Seleccione el tipo de línea de cuadrícula y el  color.

5.	Si desea etiquetar las líneas de cuadrícula, seleccione la casilla Etiquetar líneas de cuadrícula.

6.	Haga clic en Aceptar.


Selección de líneas base independientes

Un conjunto de líneas base independientes consiste en el mínimo número de líneas base requeridas para conectar todas las ocupaciones de puntos en una sesión dada de campo GPS. Para cualquier conjunto  de n ocupaciones de puntos simultáneos GPS , existen n-1 líneas base independientes. Por ejemplo, en una sesión de campo con cinco receptores, hay 10 posibles líneas base, pero sólo 4 líneas base independientes. En el diagrama a continuación, las líneas base independientes están representadas por líneas de guión.

El concepto de un conjunto de líneas base independientes se aplica principalmente a levantamientos conducidos usando técnicas de Estática y Estadística Rápida, y es particularmente importante para proyectos que incluyan ajuste de red.

El usar conjuntos independientes de líneas base asegura que el ajuste de red no haya sido afectado por un sentido artificial de redundancia (Grados de Libertad exagerados), lo que podría resultar en una subestimación del error en las coordenadas ajustadas.

Las líneas base derivadas de los campos de sesión GPS que usen más de dos receptores pueden formarse en conjuntos independientes múltiples de líneas base. La selección de las líneas base incluidas en el conjunto independiente pueden ser basadas en la calidad de las soluciones de la línea base ó en lograr una geometría de red deseada.

Para especificar un conjunto de líneas base independiente, puede llevar a cabo una de las siguientes acciones:

  Seleccione y procese sólo un conjunto independiente de líneas base de entre todas las potenciales líneas base para una sesión de campo GPS.

  Procese todas las potenciales líneas base para una sesión de campo GPS y seleccione un conjunto independiente al mismo tiempo en que los resultados son guardados en el proyecto.

  Procese todas las potenciales líneas base para un campo de sesión GPS y guarde todos los resultados en el proyecto, luego quite las líneas base dependientes de consideración por ajuste de red.

Para hacer esto, utilice la herramienta ver línea base dependiente [image]. Esta herramienta le permite vincular las observaciones en la ventana de gráficos y Línea de tiempo. Cuando seleccione esta herramienta, el software sólo muestra las líneas base posprocesadas dentro de la visualización actual Línea de tiempo, y las líneas base posprocesadas que fueron observadas a la misma hora. El resto de líneas base posprocesadas son ocultadas en la vista de levantamiento.

Para hacer esto, haga una de las siguientes:

  En la ventana Propiedades, cambie el estado de las líneas base dependientes a Inhabilitado.

  En la ventana Propiedades, cambie el estado de las líneas base dependientes para Permitir con revisión.

  En la ventana Propiedades, deje en blanco la casilla de verificación de Usar en Ajuste de Red para las líneas base dependientes.

  Use el cuadro de diálogo Observaciones para dejar en blanco Usar en la casilla de verificación para las líneas base dependientes.

La mejor forma de ejecutar estas operaciones es usando el cuadro de diálogo Edición múltiple. Por ejemplo, para cambiar el estado de líneas base dependientes a Inhabilitado:

1.	Seleccione la herramienta mostrar líneas base Dependientes.

2.	Seleccione las líneas base dependientes en la ventana de gráficos.

3.	Seleccione Edición / Edición múltiple. El cuadro de diálogo de Edición múltiple aparece.

4.	Seleccione la casilla de verificación Confg estado observación en.

5.	De la lista, seleccione Inhabilitado y haga clic en Aceptar.

Las observaciones seleccionadas ahora tendrán un estado de inhabilitadas.


Importación de archivos de Trimble 3600/5600 GDM

NOTA: Cuando hay datos topográficos tanto en un archivo de trabajo como en uno de área, primero importe el archivo de área.

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	En la ficha Levantamiento, seleccione Archivos de Trimble 3600/5600 GDM (*.job, *.are) y luego haga clic en Opciones. Aparecerá el diálogo Configuración.

3.	Especifique las configuraciones para la unidad de control Trimble 3600/5600 GDM y las configuraciones de puntos duplicados.

4.	Haga clic en Aceptar para aceptar los cambios y volver al diálogo Importar.

5.	Haga clic en Aceptar. Aparecerá el diálogo Abrir.

6.	Seleccione el archivo a importar y luego haga clic en Abrir.

NOTA: Trimble Geomatics Office supone que todos los archivos de 3600/5600 GDM están definidos como un sistema de coordenadas de factor de escala solamente. Véase más información en Factor de escala solamente.

Véase también


Exportación de un archivo de área de Trimble 3600/5600 GDM (*.are)

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	En la ficha Levantamiento, seleccione Archivos de Trimble 3600/5600 GDM (*.are) y luego haga clic en Opciones. Aparecerá el diálogo Configuración.

3.	Especifique las configuraciones de la unidad de control Trimble 3600/5600 GDM.

4.	Haga clic en Aceptar para aceptar los cambios y volver al diálogo Exportar.

5.	Haga clic en Aceptar. Aparecerá el diálogo Guardar como.

6.	Especifique un nombre de archivo y una ubicación y haga clic en Guardar. (Por defecto, el nombre de proyecto determina el nombre de archivo.)

NOTA: Las coordenadas exportadas al archivo de area usan el sistema de coordenadas definido en el proyecto de Trimble Geomatics Office.

Véase también


Exportación de un archivo Pcode (*.pco) a un instrumento Trimble 4600/5600

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	En la ficha Levantamiento, seleccione Archivo Pcode a 3600/5600 GDM (*.pco) y luego haga clic en Aceptar.

Aparecerá el diálogo Seleccionar.

3.	Seleccione un archivo Pcode y haga clic en Abrir. Aparecerá el diálogo Guardar como de Data Transfer.

4.	Seleccione un dispositivo Trimble 3600/5600 GDM y haga clic en Abrir. Aparecerá el diálogo Conectando. Una vez que se ha realizado la conexión, aparecerá el diálogo Guardar.

5.	Haga clic en Guardar. Un diálogo mostrará el desarrollo de la transferencia de archivos. Una vez que ha concluido la transferencia, se interrumpirá la conexión con el dispositivo.

Véase también


Importar - Visión de conjunto
Importar − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también

Visión de conjunto

Se pueden importar datos en varios formatos de archivo a un proyecto de Trimble Geomatics Office. Por ejemplo, se pueden importar archivos que contienen puntos de control, archivos brutos GPS (*.dat), archivos Survey Controller (*.dc) y formatos personalizados.

Consulte una descripción de formatos para importar soportados en el tema diálogo Importar.

Se pueden importar datos de:

  un dispositivo que ejecuta Trimble Survey Controller

  un receptor GPS de Trimble

  un archivo en una computadora

  una estación total

  un nivel digital

Cuando se importa un archivo, los puntos del mismo se añaden a la base de datos. Si un punto se importa con el mismo nombre de un punto que ya existe en la base de datos, la forma de mezclar los puntos dependerá de la opción seleccionada en el cuadro de diálogo Opciones Puntos Duplicados.

Lo que ocurre al importar un archivo depende del tipo de archivo. Sin embargo, para todos los tipos de archivo, automáticamente se realizará un recálculo y se creará un informe para importar (denominado <nombre del archivo importado>.html) y se almacenará en la carpeta Informes del proyecto.

Todas las entidades importadas de un archivo se guardan en un conjunto de selección. Con archivos .dc, el conjunto de selección se denomina de acuerdo con el nombre de trabajo interno en el archivo. Con otros tipos de archivo dicho conjunto recibe el nombre del archivo para importar. Para administrar conjuntos de selección, use el comando Seleccionar / Conjuntos de selección.

SUGERENCIA: Para ver sólo datos (en un conjunto de selección) use la opción Mostrar Datos Solamente en la opción del conjunto de selección en el cuadro de diálogo Filtros de Vista.

SUGERENCIA: Para revertir una operación de importación, use el comando Deshacer. Si ha cerrado el proyecto después de la importación, utilice la opción De origen(es) en el diálogo Seleccionar puntos / ficha General y elimine la selección para deshacer la operación de importación.

NOTA: Si importa un archivo más de una vez al mismo proyecto, el mismo se añadirá a la carpeta correspondiente, con un guión y un número al final del nombre de archivo. Por ejemplo, si importa dos veces un archivo de datos brutos GPS (.dat) de Trimble denominado MyGPSFile dos veces, se creará una carpeta llamada MyGPSFile (durante la primera importación del archivo). En dicha carpeta serán MyGPSFile.dat y MyGPSFile-1.dat. Los datos duplicados son identificados al importar y no se agregan a la base de datos.


Diálogo Importar

Use este diálogo para importar datos al proyecto.

Para acceder al mismo, realice una de las siguientes acciones:

  Seleccione Archivo / Importar.

  Haga clic en el botón Importar [image] en la barra de herramientas estándar.

Los formatos de Importar están organizados en tres fichas:

  Levantamiento

  CAD / ASCII

  Personalizado

Nuevo formato

Este botón está disponible cuando se selecciona la ficha Personalizado.

Para crear un nuevo formato personalizado, haga clic en Nuevo formato. Aparecerá el diálogo Definir formato para importar ASCII.

Use dicho diálogo para definir el formato para importar.

Editar formato

Este botón está disponible cuando se selecciona la ficha Personalizado.

Haga clic en Editar formato para modificar los formatos para importar ASCII existentes.

Aparecerá el diálogo Definir formato para importar ASCII.

Use dicho diálogo para editar el formato para importar.

Eliminar formato

Este botón está disponible cuando se selecciona la ficha Personalizado.

Haga clic en Eliminar para eliminar un formato para importar personalizado. Se le pedirá que lo confirme.

Para confirmar la eliminación, haga clic en Sí.

Personalizar

Use el botón Personalizar para seleccionar la lista de opciones para importar que se muestran en el diálogo Importar.  Seleccione las opciones para importar requeridas en la lista.

Se podrá añadir un filtro externo del diálogo Personalizar. Los filtros externos son programas diferentes que se pueden escribir para integrarse con Trimble Geomatics Office. Si se los añade al sistema, los filtros externos escritos para utilizarlos dentro de Trimble Geomatics Office deberán cumplir requerimientos específicos. Sólo aparecerán los filtros actualmente instalados para la ficha seleccionada en el diálogo Importar.

Los programas de filtros deberán compilarse como un archivo de biblioteca de vínculos dinámicos (*.dll) con funciones exportadas específicas y deben crearse como un objeto COM (Component Object Module – Módulo de objetos componentes).

Una vez que ha seleccionado el archivo correspondiente, Trimble Geomatics Office registrará el objeto COM del filtro en la computadora y verificará que la interfaz de .dll cumpla con los requerimientos del sistema. Si no se logra, el sistema informará que no es posible registrar el filtro. Si el filtro lograr instalarse sin problemas, la descripción breve del filtro aparecerá listada en el diálogo.

Véase más información en Filtros para importar/exportar externo.

Opciones

Para el archivo importado, haga clic en el botón Opciones para:

  especificar cómo manejar puntos duplicados durante la importación.

  configurar la calidad de los datos para importar.

  especificar las unidades de los datos importados.

  especificar las configuraciones en el archivo importado.

  cambiar las opciones para importar datos a un dispositivo, 3300/3600/5600 Elta M5 ó 3600/5600 GDM.

Si selecciona un sistema de coordenadas que es diferente del que se está utilizando para el proyecto, Trimble Geomatics Office leerá el archivo, convertirá las coordenadas al sistema de coordenadas del proyecto, almacenará los puntos y los mostrará en el sistema de coordenadas del proyecto. El archivo de datos será el mismo.

NOTA: Los valores de coordenadas que se muestran en Trimble Geomatics Office para puntos importados de un archivo de datos pueden ser diferentes de aquellos en el archivo.


Formatos para Importar - Ficha Levantamiento
Formatos para Importar − Ficha Levantamiento

 Visión de conjunto y más información

Use la ficha Levantamiento para importar datos de Trimble Survey Controller, un receptor GPS, un instrumento Trimble 3600/5600 GDM, una estación total, un nivel digital o archivos de datos topográficos en una computadora.

Para acceder a la ficha Importar / Levantamiento:

1.	Seleccione Archivo / Importar.

Seleccione la ficha Levantamiento.

Se pueden pasar formatos personalizados a esta ficha. Consulte más información en archivo Asciiimp.dat.

NOTA: También puede utilizar arrastrar y colocar para importar archivos.

Use la ficha Levantamiento para importar los siguientes formatos:

Formato	Use este formato para importar …
Archivos de nivel digital (*.dat, *.raw)	Archivos de nivel Digital
Archivos de datos GPS (*.dat)	Archivos .dat GPS de Trimble de la computadora.
Archivos DTM (*.dtx) cuadriculados	un modelo digital del terreno cuadriculado que se ha creado usando el software DTMLink software.
Archivos de hojas de datos NGS (*.dat, *.dsx, *.htm, *.html)	Archivos de datos con formato estándar Topografía Geodésica Nacional (National Geodetic Survey) (NGS).
Formato Trimble Data Exchange (intercambio de datos)	un archivo ASCII con datos con formato Trimble Data Exchange. Este formato se usa principalmente para transferir datos topográficos a otros paquetes de software.
Archivos de efemérides de precisión (*.sp3, *.e18)	un archivo de formato efemérides de precisión utilizado para el procesamiento de líneas base. Este archivo se almacena en el área de Archivos Comunes. Para seleccionarlo, use el cuadro de diálogo Estilos de procesamiento GPS.
Archivos RINEX (*.Xxo, *.XXn, *.obs, *.nav)	Archivos con formato de Intercambio Independiente del Receptor. Este formato le permite transferir archivos de datos brutos GPS de cualquier fabricante de receptores GPS. Se necesita un mensaje de navegación y un archivo de observación en la misma carpeta.
Archivos Sokkia Data Recorder (*.sdr)	un archivo con formato Sokkia Data Recorder de una computadora.
Archivos SSF/SSK (*.ssf, *.ssk)	Archivos de solución cinemática con posprocesamiento o archivos de solución estática con posprocesamiento utilizando el software Trimble GPSurvey software.
Archivos Survey Controller (*.dc)	un archivo con formato Trimble Survey Controller de una computadora.  Al importar archivos .dc, todas las observaciones o vectores GPS con alturas de prisma, de instrumento y de antena asociadas se almacenarán en el proyecto. Estos datos se utilizan para calcular.
Dispositivos topográficos	Datos directamente de estaciones totales soportadas, dispositivos, tarjetas de datos topográficos y receptores GPS.
Otro archivo de colector de datos	Los archivos de colectores de datos de terceros que se proveen utilizando un filtro para importar/exportar externo.  Los siguientes formatos de terceros se suministran con Trimble Geomatics Office: Leica GS1-16 SDMS (importa puntos coordinados) Datos ASCII Nikon AP-700 Datos con formato Topcon GTS-700 y FC-5
Archivos de Trimble 3600/5600 GDM (*.job, *.are)	Archivos de datos de Trimble 3600/5600 GDM
Archivo de trabajo de TDS Survey Pro CE (*.job)	Importa archivos de trabajo de TDS Survey Pro CE
Archivo bruto de TDS Survey Pro CE (*.raw)	Importa archivos brutos de TDS Survey Pro CE
Archivos M5 de Trimble 3300 / 3600 / 5600 Elta (*.dat)	Importa un archivo M5 de 3300 / 3600 / 5600 Elta
Archivos de coord de Trimble 3600 / 5600 TDS (*.cr5)	Importa archivos de coordenadas de Trimble 3600 / 5600 TDS
Archivos brutos de Trimble 3600 / 5600 TDS (*.rw5)	Importa archivos brutos de Trimble 3600 / 5600 TDS
Archivos M5 de Trimble Elta GPS Controller (*dat)	Importa archivos M5 de Trimble Elta GPS Controller


Opción Archivo de Hoja de Datos NGS (*.dat, *.dsx, *.htm, *.html)

Se pueden importar archivos de datos de formato estándar Topografía geodésica nacional (National Geodetic Survey) (NGS).

Trimble Geomatics Office supone que todos los datos NGS que se importan a un proyecto están en un datum NAD-83 (es decir, son compatibles con un datum WGS-84).

Si se importan datos NGS a un proyecto que no se reconoce como basado en un datum NAD-83, Trimble Geomatics Office no puede estar seguro de que los datos NGS sean adecuados.

NOTA: Trimble Geomatics Office reconoce un datum NAD-83 por el nombre (es decir, todo datum que empieza con NAD-83).

Si su datum no es equivalente al NAD-83, aparecerá la siguiente advertencia:

No parece que su proyecto esté en un datum NAD 1983. Esto creará problemas ya que los datos importados están en el datum NAD 1983 y no va a intentarse la conversión al datum del proyecto.

¿Quiere continuar con la importación?

ADVERTENCIA: Si opta por continuar con la importación, las coordenadas NGS se interpretarán usando un datum definido para el proyecto. Si dicho datum no es equivalente al NAD-83, esta interpretación será incorrecta.


Formatos para importar CAD / ASCII

Para acceder a la ficha Importar / CAD/ASCII:

1.	Seleccione Archivo / Importar.

2.	Seleccione la ficha CAD/ASCII.

NOTA: Los formatos para importar que manejan archivos ASCII siempre esperan recibir datos numéricos de forma estandarizada. Esta forma no incluye separadores de miles o puntos para el punto decimal.

Se pueden pasar formatos personalizados a esta ficha. Consulte más información en archivo Asciiimp.dat.

NOTA: También puede utilizar arrastrar y colocar para importar archivos.

Use la ficha CAD/ASCII para importar los siguientes formatos:

Formato	Use este formato para importar …
Archivos AutoCAD (*.dwg, *.dxf)	puntos coordinados y trabajos de línea que usen archivos .dxf y .dwg, ASCII y binarios (hasta .dxf Versión 14).
Formato estándar C & G	un archivo ASCII estándar del software C & G.
C & G sin comillas	un archivo ASCII con formato estándar del software C & G sin comillas.
Archivos CMM COR y LEV (*.cor, *.lev)	Archivos ASCII con formato estándar utilizados por la Oficina de Administración de Tierra (Bureaux of Land Management). La opción de archivos CMM COR o LEV se suministra usando un filtro externo para importar.
archivo NMEA	puntos de archivos de formato NMEA (cadenas GGA, GGK, y PJK). NMEA es un estándar desarrollado por la Asociación de Electrónica Marítima Nacional (National Marine Electronics Association) que define los formatos de datos para la comunicación de datos de navegación  entre instrumentos de navegación marítima.
formato Pacsoft	un archivo estándar ASCII del software Pacsoft.
Coordenadas SDRmap	un archivo de texto de coordenadas SDRmap.
TPLANE (LLHE)	un archivo ASCII de Trimble GPSurvey.
Archivo Gráfico TRIMMAP (*.tgf)	un archivo gráfico TRIMMAP (o SDRmap) *.tgf.
formato WILDsoft	un archivo ASCII estándar del software WILDsoft.
Archivos de proyecto de Terramodel (*.pro)	Puntos, líneas y capas de archivos de proyecto de Terramodel.


Formatos para importar personalizados

Para acceder a la ficha Importar / Personalizado:

Seleccione Archivo / Importar.

Seleccione la ficha Personalizado.

NOTA: Alternativamente, use arrastrar y colocar para importar archivos.

Se pueden pasar formatos personalizados a otras fichas. Consulte más información en archivo Asciiimp.dat.

Use la ficha Personalizado para:

  importar archivos de datos en un formato personalizado

  añadir nuevos formatos para importar personalizados

  editar formatos para importar personalizados existentes

  eliminar formatos para importar personalizados.

Se proveen los siguientes formatos personalizados:

  Puntos delimitados

  Puntos de anchura fija

  Nombre,Este,Norte,Elevación,Código

  Nombre,Latitud,Longtitud,Altura,Código (Local)

  Nombre,Latitud,Longtitud,Altura,Código (WGS-84)

  Nombre,Norte,Este,Elevación,Código

Al importar valores de un archivo ASCII, Trimble Geomatics Office puede leer valores que usan el símbolo de agrupación de dígitos y el símbolo decimal definido en Panel de control / Configuración regional / ficha Número de Microsoft Windows. El sistema también leerá valores de forma estandarizada. Es decir, sin un símbolo de agrupación de dígitos (separador de miles) y un punto para el símbolo decimal.

Todos los formatos para importar personalizados se escriben en el archivo Asciiimp.dat.


Diálogo Definir formato para importar ASCII

 Visión de conjunto y más información

Use este diálogo para definir los formatos para importar ASCII.

Para acceder al mismo:

1.	Seleccione Archivo / Importar. El cuadro de diálogo Importar aparecerá.

2.	En la ficha Personalizado, realice una de las siguientes acciones:

  Para crear un nuevo formato, haga clic en Nuevo formato.

  Para modificar un formato existente, haga clic en Editar formato.

Nombre

Introduzca o edite el nombre del formato para importar. Dicho nombre aparece en la lista Tipos en la ficha Personalizado del diálogo Importar. No se permiten nombres duplicados.

Cadena nula

Introduzca la cadena nula para la definición del formato para importar. Este campo es opcional. La cadena nula que se especifica aquí se interpretará durante la importación de un archivo para indicar que no hay un valor disponible para un registro particular.

Si Trimble Geomatics Office encuentra la cadena nula especificada, no asigna ningún valor al campo adecuado de la base de datos a medida que los datos se añaden a la base de datos.

NOTA: Algunos tipos de archivo pueden requerir una cadena particular tal como ″99999.99″, ″*****″  ó similar. Al especificar la configuración, se puede requerir a Trimble Geomatics Office que utilice su preferencia.

Descripción

Introduzca una descripción del formato para importar. La descripción aparecerá en la barra de estado cuando se resalte el formato en el diálogo Importar. Este campo es opcional.

Extensión por defecto

Introduzca una extensión por defecto para el formato para importar. Por ejemplo, .dat o .fbk. Este campo es opcional y si se omite, se supondrá que es ".txt".

SUGERENCIA: Para aceptar todas las extensiones de archivo, introduzca ???

NOTA: Trimble Geomatics Office usa la extensión en el campo Listar archivos de tipo en el diálogo Abrir. El mismo coloca el(los) nombre(s) de (de los) archivo(s) con la extensión especificada en la lista Nombre. Trimble Geomatics Office automáticamente adopta el punto entre el nombre y una extensión.

Importar como

Seleccione el tipo de registro correspondiente como el destino para los datos en el (los) archivos(s) importado(s). Por lo general es la tabla Puntos.

Rellenar formato automáticamente

Haga clic en Rellenar formato automáticamente y se abrirá el diálogo Insertar formato. Use este diálogo para inicializar automáticamente la cabecera del formato y las definiciones del cuerpo. Para obtener más información, consulte Rellenar formato automáticamente.

Cabecera del formato

Al emplear los códigos de campo del menú abreviado, se puede construir una definición para que coincida u omita la primera parte fija de un archivo para importar. Trimble Geomatics Office utiliza la definición de la cabecera una vez (y sólo una vez) al comienzo del archivo. Si las líneas de la cabecera en un archivo para importar no logran coincidir con la definición, entonces la lectura del archivo se detendrá. Esto es útil para la verificación del formato del archivo.

NOTA: Para añadir líneas en blanco a la definición de la cabecera, presione las teclas Ctrl+Enter.

Por ejemplo, una definición de cabecera que consiste en los códigos de campo [$Omitir.Línea:7] hará que Trimble Geomatics Office omita las primeras siete líneas en un archivo e interprete el resto del mismo tal y como lo ha definido el cuerpo del formato.

Cuerpo del formato

Al emplear los códigos de campo disponibles del menú abreviado, se puede construir una definición que coincida con los datos en el archivo a leer. Si los datos relacionados con una única entidad se definen sobre líneas múltiples, esto se manejará en la definición al presionar las teclas Ctrl+Enter para iniciar una nueva línea de definición.

Consulte más información sobre todos los campos disponibles en el sistema en Códigos de campo −Visión de conjunto.

A medida que se importa un archivo, Trimble Geomatics Office intenta interpretar varias veces las líneas que se leen en el (los) código(s) de campo en la definición. Si el archivo para importar no coincide con la definición, la falta de coincidencia se registrará en el informe para importar y el programa luego intentará encontrar más datos en el archivo que coincide con la definición.

NOTA: Trimble Geomatics Office automáticamente inicia la definición del Cuerpo del formato en una nueva línea después de la definición de la cabecera.

Pie del formato

Al emplear los códigos de campo disponibles del menú abreviado, se puede construir una definición del pie para que coincida u omita la parte fija final de un archivo para importar.

Trimble Geomatics Office utiliza la definición del pie sólo una vez al final del archivo. Si las líneas del pie en un archivo para importar no logran coincidir con la definición, entonces la lectura del archivo se detendrá. Esto es útil para la verificación del formato del archivo.

NOTA: Para añadir líneas en blanco a la definición del pie presione las teclas Ctrl+Enter.

Trimble Geomatics Office automáticamente iniciará la definición del Pie del formato en una nueva línea después de la definición del cuerpo.

Consulte ejemplos de la importación ASCII personalizada en Formato para importar ASCII personalizado - Ejemplos.


Formato para importar ASCII personalizado - Ejemplos
Formato para importar ASCII personalizado − Ejemplos

Véase también
Estos ejemplos muestran cómo definir algunos formatos para importar ASCII.

Ejemplo 1

Para leer un archivo con las siguientes líneas en el mismo:

Formato archivo Versión 1.00

Fecha: 8/11/99

Proyecto: Ejemplo

1000,534247.541,263104.807,10.118,EST

1024,534220.249,263104.249,10.129,BA

1025,534222.850,263100.894,10.133,ARBOL

1026,534222.218,263095.934,10.136,ARBOL

1027,534224.816,263092.579,10.140,POSTE

1028,534228.398,263089.101,10.732,VALLA

1041,534236.948,263084.989,11.054,VALLA

1042,534237.326,263087.964,10.982,VALLA

1087,534243.575,263099.773,10.154,BA

La cabecera del formato podría definirse así:

Formato archivo Versión 1.00	Verifica la primera línea del archivo
[$Omitir.Línea:2]	Omite las dos líneas siguientes que no tengan un contenido definido

El cuerpo del formato se definirá como:

[Nombre],[Este],[Norte],[Elevación],[Código característica]

Ejemplo 2

Para leer un archivo con las siguientes líneas en el mismo:

1000  534247.541  263104.807      10.118 EST

1024  534220.249  263104.249      10.129 BA

1025  534222.850  263100.894      10.133 ARBOL

1026  534222.218  263095.934      10.136 ARBOL

1027  534224.816  263092.579      10.140 POSTE

1028  534228.398  263089.101      10.732 VALLA

1041  534236.948  263084.989      11.054 VALLA

1042  534237.326  263087.964      10.982 VALLA

1087  534243.575  263099.773      10.154 BA

No se definirá ninguna cabecera de formato.

El cuerpo del formato se definirá como:

[Nombre:4][Este:12.3][Norte:12.3][Elevación:12.3] [Código característica]


Rellenar formato automáticamente / Diálogo Insertar formato

Seleccione Rellenar formato automáticamente para inicializar automáticamente las definiciones del cuerpo del (de los) Formato(s) para importar o exportar o del Informe base de datos. Al hacer clic en dicho botón, aparecerá el diálogo Insertar formato.

NOTA: Este botón aparece en los siguientes diálogos:

  Archivo / Importar / diálogo Definir formato para importar ASCII

  Archivo / Exportar / diálogo Definir formato para exportar ASCII

  Informes / Informes personalizados / diálogo Definir Formato informe

Trimble Geomatics Office crea un conjunto de códigos de campo por defecto para todos los datos implicados. Al utilizar este valor por defecto inicial como una base para el nuevo formato, se puede modificar la definición según se necesite.

Distribución

Este grupo le da control sobre el formato del informe o de la definición.

NOTA: Una vez que ha creado un informe, podrá editarlo aun más usando un editor HTML.

Anchura fija

Elija esta opción para asignar a cada campo de la definición una anchura fija por defecto.

NOTA: Con esta opción no se creará información de cabecera por defecto en las definiciones para importar o exportar.

Delimitado

Elija esta opción para introducir los campos. Esta le permite configurar el delimitador a utilizar entre los campos del registro o la definición.

NOTA: En todos estos casos con esta opción se creará información sobre la cabecera.

Separador de campo

Use este campo para especificar el(los) carácter(es) a insertar entre los campos del registro o la definición.

SUGERENCIA: El campo provee valores por defecto, pero usted puede introducir cualquier otro carácter (o caracteres) que prefiera en el campo.

Delimitador de texto

Use este campo para especificar el(los) carácter(es) a añadir antes y después de cada campo textual en el registro o la definición.

SUGERENCIA: El campo provee valores por defecto, pero usted puede introducir cualquier otro carácter (o caracteres) que prefiera en el campo.


Exportar - Visión de conjunto
Exportar − Visión de conjunto

Cómo ...	Diálogo	Véase también
Exporte datos del proyecto si necesita datos en un formato diferente. Por ejemplo, si desea usar los datos en un paquete de software distinto o si desea enviar archivos a Trimble Survey Controller.

Se pueden exportar datos en diversos formatos de archivo del proyecto de Trimble Geomatics Office. Por ejemplo, se pueden exportar datos a(al):

  Trimble Survey Controller (si necesita archivos para finalizar un trabajo de campo, por ejemplo bibliotecas de características y atributos)

  varios formatos ASCII (si necesita datos en otro formato, por ejemplo)

  varios formatos GIS comunes

  formatos personalizados (y definir formatos personalizados)

Consulte una descripción de los formatos para exportar formatos soportados en el diálogo Exportar.


Diálogo Exportar

Use este diálogo para exportar datos del proyecto.

Para acceder al mismo, realice una de las siguientes acciones:

  Seleccione Archivo / Exportar.

  Seleccione la herramienta Exportar [image].

NOTA: Cualquier formato para exportar que arroja archivos ASCII siempre arrojará datos numéricos de manera estándar (sin separadores para los miles y con puntos para las cifras decimales). Los datos exportados en los archivos ASCII se expresan en las unidades que Trimble Geomatics Office usa para la visualización. Sin embargo, podrá especificar unidades diferentes para exportar en la lista Unidades de Datos para exportar. Alternativamente, cambia las unidades de visualización de Trimble Geomatics Office seleccionando Archivo / Propiedades proyecto, y luego seleccione la ficha Unidades y formato en el diálogo Propiedades proyecto que aparece.

Para mostrar una descripción de un formato para exportar en la barra de estado, resalte el formato para exportar. Los Formatos para exportar están distribuidos en las siguientes fichas:

  Levantamiento

  CAD / ASCII

  GIS

  Personalizado

Nuevo formato

Este botón estará disponible al resaltar la ficha Personalizado.

Para crear un nuevo formato de informe personalizado, haga clic en Nuevo formato y luego utilice el diálogo Definir formato para exportar ASCII para definir el formato para exportar.

Editar formato

Este botón está disponible al resaltar la ficha Personalizado.

Para modificar un formato para exportar ASCII existente, haga clic en Editar formato y luego utilice el diálogo Definir formato para exportar ASCII para modificar el formato para exportar. Consulte más información sobre la definición de un formato personalizado en los ejemplos del tema Definir formato para exportar ASCII − Ejemplos.

Eliminar formato

Este botón está disponible al resaltar la ficha Personalizado.

Para eliminar un formato para exportar personalizado, haga clic en Eliminar formato y luego confirme su acción o cancele.

Personalizar

Use el botón Personalizar para seleccionar la lista de opciones para exportar que se muestran en el diálogo Exportar.  Seleccione las opciones para exportar requeridas en la lista.

Se podrá añadir un filtro externo del diálogo Personalizar. Los filtros externos son programas diferentes que se pueden escribir para integrarlos con Trimble Geomatics Office. Si se los añade al sistema, los filtros externos escritos para utilizarlos dentro de Trimble Geomatics Office deberán cumplir requerimientos específicos. Sólo aparecerán los filtros actualmente instalados para la ficha seleccionada en el diálogo Exportar.

Los programas de filtros deberán compilarse como un archivo de biblioteca de vínculos dinámicos (*.dll) con funciones exportadas específicas y deben crearse como un objeto COM (Component Object Module – Módulo de objetos componentes).

Una vez que ha seleccionado el archivo correspondiente, Trimble Geomatics Office registrará el objeto COM del filtro en la computadora y verificará que la interfaz de .dll cumpla con los requerimientos del sistema. Si no se logra, el sistema informará que no es posible registrar el filtro. Si el filtro lograr instalarse sin problemas, la descripción breve del filtro aparecerá listada en el diálogo.

Véase más información en Filtros para importar/exportar externo.

Opciones

Para el archivo exportado, haga clic en el botón Opciones para:

  especificar la unidades de los datos exportados.

  especificar las configuraciones en el archivo exportado.

  cambiar el sistema de coordenadas del archivo de datos que está exportando.

  cambiar las opciones para exportar datos a un dispositivo, 3300/3600/5600 Elta M5 ó 3600/5600 GDM.

Cuando no se puede configurar un formato para exportar, este botón no estará disponible.

Para configurar detalles de configuración acerca del archivo específico a exportar, haga clic en Opciones. Por ejemplo, en el caso del formato AutoCAD (*.dxf o *.dwg) se puede seleccionar el formato de datos Opciones para exportar AutoCAD (.dwg, Ascii .dxf, Binario .dxf), el número de versión de AutoCAD y referenciar un prototipo de dibujo.

Sistema de coordenadas para datos para exportar

Para seleccionar el sistema de coordenadas del archivo de datos que desea exportar, haga clic en Cambiar en el diálogo Opciones. Este botón está disponible si el formato actualmente resaltado no tiene una definición de sistema de coordenadas incluida en el archivo. Si selecciona un sistema de coordenadas que es diferente del que se está empleando para el proyecto, Trimble Geomatics Office convertirá las coordenadas de los puntos a exportar al sistema de coordenadas seleccionado, escribirá el archivo para exportar y almacenará los puntos en el sistema de coordenadas seleccionado.

NOTA: Los valores de coordenadas para los puntos visualizados en Trimble Geomatics Office pueden diferir de los que se han escrito en el archivo.

Exportar

Si se ha hecho una selección actual utilizando las herramientas de selección entonces se podrá elegir entre exportar los datos seleccionados o exportar toda la base de datos.

Hay dos opciones disponibles:

Selección	Exporta puntos seleccionados
Toda base de datos	Exporta todos los puntos de la base de datos
Cuando no haya selección actual, los botones de selección no estarán disponibles y la exportación se aplicará a toda la base de datos.

Ordenar Datos

Puede elegir el orden en el cual los datos son exportados:

1.	1.	Seleccione la casilla de verificación Ordenar Datos.

2.	2.	Seleccione  un tipo de ordenamiento de la lista. Escoja entre:

Orden de la Base de Datos	Elevación
Nombre	Calidad
Hora de Inicio	Tipo de Datos
Longitud de la ocupación

NOTA: Las mismas opciones de ordenamiento están disponibles en la ventana de Propiedades.

Sugerencia: Si agrega sus propias consultas de ordenamiento, éstas serán agregadas a la lista. Para más información, refiérase al tema Consultas de Bases de Datos – Visión de conjunto.


Formatos para exportar - Ficha Levantamiento
Formatos para exportar − Ficha Levantamiento

 Visión de conjunto y más información

Use la ficha Levantamiento del diálogo Exportar para exportar datos topográficos a un dispositivo.

Para acceder dicha ficha:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

Se pueden pasar formatos personalizados a dicha ficha. Consulte más información en archivo Asciiexp.dat.

Esta ficha contiene los siguientes formatos:

Opción	Use esta opción para exportar …
Detalles antena al Survey Controller	nuevos detalles de antena a Trimble Survey Controller. Por ejemplo, si Trimble produce una nueva antena, use esta opción para exportar o transferir los detalles de antena a Trimble Survey Controller.
Mapa de fondo al Trimble Survey Controller (*.dxf)	un archivo dxf a Trimble Survey Controller (versión 10 ó posterior).
Archivo de coordenadas delimitado por comas al Trimble Survey Controller (*.csv)	un archivo csv a Trimble Survey Controller (versión 10 ó posterior).
Diccionario de datos al Survey Controller (*.ddf)	un archivo de diccionario de datos (.ddf) a un dispositivo que está ejecutando Trimble Survey Controller. Para hacerlo, tendrá que instalar un dispositivo Survey Controller. Puede crear un archivo .ddf en la utilidad Editor de diccionarios de datos. Dicha utilidad es parte del software GPS Pathfinder de Trimble. NOTA: Sólo puede exportar un archivo .ddf a Trimble Survey Controller (versión 7.00).
Cuadrícula del Datum al Survey Controller (*.cdg)	la cuadrícula del datum a Trimble Survey Controller (versión 7.00 ó posterior). Se puede reducir el tamaño del archivo de la cuadrícula del datum que se transfiere (subcuadrícula). Las primeras versiones de Trimble Survey Controller no soportan cuadrículas del datum.  Para hacerlo, tendrá que instalar un dispositivo Survey Controller. NOTA: Sólo el archivo de la cuadrícula del datum utilizado en el sistema de coordenadas del proyecto actual puede dividirse en subcuadrículas, pero puede exportar cuadrículas del datum combinadas
Archivo de descripción a dispositivo TDS (*.txt)	un archivo de descripción (*.txt) a un dispositivo que ejecuta el software TDS. Para ello, primero debe instalar un dispositivo TDS. El archivo de descripción puede crearse manualmente o exportarse de la utilidad Feature Code Editor.
Puntos MDT al archivo (*.dtx)	un archivo del Modelo digital del terreno (*.dtx), compatible con Trimble Survey Controller, de los puntos seleccionados en el proyecto.
Puntos MDT al Survey Controller	un archivo del Modelo digital del terreno (*.dtx), compatible con Trimble Survey Controller, de los puntos seleccionados para exportar directamente a Trimble Survey Controller.  Para hacerlo, tendrá que instalar un dispositivo Survey Controller.
Biblioteca de caract. y atributos al archivo SDR33. (*.sdr)	un archivo SDR33 que contiene registros de nota para código de característica en la biblioteca que selecciona. No se pueden exportar atributos con esta opción.
Biblioteca de caract, y atributos al Survey Controller (*.fcl)	una biblioteca de características y atributos a un dispositivo que está ejecutando Trimble Survey Controller. El archivo puede o no contener atributos. (Si se van a exportar atributos, seleccione la casilla de verificación). Para hacerlo, tendrá que instalar un dispositivo Survey Controller. No se transfiere ninguna otra información de la biblioteca de características y atributos (por ejemplo, estilos de punto) a Trimble Survey Controller.
Biblioteca de caract. y atributos al dispositivo TDS (*.fcl)	un archivo de descripción (*.txt) basado en la biblioteca de características y atributos seleccionada a un dispositivo que ejecuta el software TDS. Para ello, primero deberá instalar un dispositivo TDS. Los atributos no se exportarán al software TDS.
Archivo de geoide al Survey Controller (*.ggf)	un archivo de la cuadrícula del geoide a un dispositivo que está ejecutando Trimble Survey Controller (versión 6 ó posterior). Puede seleccionar el área en la que se encuentra trabajando. Ello reduce el tamaño del archivo de la cuadrícula del geoide transferido. Para hacerlo, tendrá que instalar un dispositivo Survey Controller. NOTA: Para las subcuadrículas, debe utilizar un sistema de coordenadas que tenga un modelo geoidal definido. Sólo el archivo de la cuadrícula del geoide actualmente utilizado puede dividirse en subcuadrículas, pero puede exportar cualquier archivo de geoide.
Archivo de geoide al TDS Survey Pro (CE)	un archivo de cuadrícula de geoide a un dispositivo que ejecuta TDS Survey Pro (CE).  Podrá seleccionar el area en la que está trabajando. Ello reduce el tamaño del archivo de cuadrícula de geoide transferido
Archivos NGS Bluebook	archivos B, G y SERFIL. El formato NGS Bluebook se usa principalmente para transferir líneas base GPS al Estudio Geodésico Nacional de EEUU (US National Geodetic Survey) para incluirlas en la red de control nacional.
Archivo Pcode a 3600/5600 GDM (*pco)	un archivo pcode a un 3600/5600 GDM.
Formato Trimble Data Exchange	datos topográficos del proyecto de Trimble Geomatics Office. Use este formato para copiar datos topográficos entre proyectos de Trimble Geomatics Office. Este formato también se usa para exportar datos a otros paquetes de software para ajustes de red. El formato ha sido definido por Trimble y se usa para producir un archivo ASCII que contiene estaciones y coordenadas, vectores GPS procesados, observaciones terrestres, observaciones láser, información de nivelación y de acimut. Consulte con su proveedor de software de ajuste de red si se soporta este formato.
Archivos SDR (*.sdr)	un archivo .sdr que usa la proyección actual en la versión configurada. Haga clic en Opciones para cambiar la configuración.
Puntos de control STAR*NET 2D	puntos de control con formato STAR*NET 2D. Solamente se exportan los puntos en la base de datos que tienen una calidad Control Norte/Este. La calidad Elevación puede ser de cualquier calidad. Al trabajar con el paquete STAR*NET se dará cuenta de que es mejor si combina puntos de control y archivos de observación en un único archivo utilizando un editor de texto adecuado.
Puntos de control STAR*NET 3D	puntos de control con formato STAR*NET 3D. Solamente se exportan los puntos en la base de datos que tienen una calidad Control Norte/Este y una calidad de elevación de Control. Al trabajar con el paquete STAR*NET se dará cuenta de que es mejor si combina puntos de control y archivos de observación en un único archivo utilizando un editor de texto adecuado.
Observaciones STAR*NET	todas las observaciones convencionales en la base de datos del proyecto con el formato de observación STAR*NET. Al trabajar con el paquete STAR*NET se dará cuenta de que es mejor si combina puntos de control y archivos de observación en un único archivo utilizando un editor de texto adecuado.
Dispositivo Topográfico	datos directamente a estaciones totales soportadas, dispositivos, tarjetas de datos topográficos y receptores GPS.
Survey Controller (*.dc)	un archivo .dc que utilizando el proyecto actual en la versión configurada. Haga clic en Opciones para cambiar la configuración.
Archivos M5 de Trimble 3300 / 3600 /5600 Elta	un archivo M5 de Trimble 3300 / 3600 /5600 Elta
Archivos de Trimble 3600/5600 GDM (*.are)	un archivo de área de Trimble 3600/5600 GDM
Archivos M5 de Trimble Elta GPS Controller (*.dat)	un archivo de coordenadas M5 de Trimble Elta GPS Controller
Archivo de trabajo de TDS Survey Pro (CE) (*.job)	un archivo de trabajo a un dispositivo TDS Survey Pro CE.
Archivos de coord de Trimble 3600/5600 TDS (*.cr5)	un archivo de coordenadas a un dispositivo Trimble 3600/5600 TDS.
Archivos con formato Trimble Data Exchange (*.asc)	un archivo TDEF


Formatos para exportar CAD / ASCII

 Visión de conjunto y más información

Use la ficha CAD/ASCII para exportar datos a diversos formatos ASCII y CAD.

Para acceder a la ficha Exportar /CAD/ ASCII:

Seleccione Archivo / Exportar. El cuadro de diálogo Exportar aparece.

Seleccione la ficha CAD/ASCII.

Se pueden pasar formatos personalizados a dicha ficha. Consulte más información en archivo Asciiexp.dat.

NOTA: Cualquier formato para exportar que arroje archivos ASCII siempre arrojará datos numéricos de manera estándar (sin separadores para los miles y con puntos para las cifras decimales). Los valores arrojados en un archivo ASCII se encuentran en las mismas unidades que se están utilizando actualmente para mostrarlos en el sistema, a menos que cambie las unidades usando la lista Unidades de Datos para exportar. Para cambiar las unidades de visualización del sistema, seleccione Archivo / Propiedades proyecto. Se abrirá el diálogo Propiedades proyecto. Seleccione la ficha Unidades y formato.

Esta ficha tiene las siguientes opciones:

Opción	Use esta opción para exportar ...
Archivos AutoCAD (*.dxf, *.dwg)	Un archivo drawing o drawing exchange  para AutoCAD. Para configurar el formato de datos, la versión y el prototipo de dibujo, haga clic en Opciones.
Formato estándar C&G	Un archivo con formato ASCII estándar del software C&G.
C&G sin comillas	Un archivo con formato ASCII estándar del software C&G sin comillas.
Archivo CMM (*.cor, *.lev)	Archivos con formato ASCII estándar utilizados por la Oficina de Administración de Tierra (Bureaux of Land Management). La opción de archivo CMM (*.cor, *.lev) se provee utilizando un filtro externo para exportar.
Notas de atributos del archivo DC (Survey Controller V4)	Un archivo .dc de Trimble Survey Controller versión 4 que tiene atributos con valores separados por dos puntos (:). Los atributos capturados utilizando una biblioteca de características y atributos no se exportan en dicho formato.
Formato Pacsoft	Un archivo con formato ASCII de Pacsoft.
Formato SDMS	Datos con formato Administración de datos topográficos de  AASHTO.
coordenadas SDRmap	Un archivo de coordenadas SDRmap.
Archivo Fieldbook Autodesk (*.fbk)	Un archivo en formato ‘Fieldbook’ de Autodesk.
Archivo TERRAMODEL – P,N,E,Z,20D –(*.pts)	Un archivo con formato básico, delimitado por comas
TPLAN (LLHE)	Un archivo con formato ASCII de GPSurvey de Trimble. Las coordenadas de latitud y longitud WGS-84 se exportan con dicha opción.
Archivos de gráficos TRIMMAP (*.tgf)	Un archivo de gráficos TRIMMAP (o SDRmap).
Formato WILDsoft	Un archivo ASCII con formato WILDsoft.


Formatos para exportar - Ficha Personalizado
Formatos para exportar − Ficha Personalizado

Para acceder a la ficha Exportar / Personalizado:

1.	Seleccione Archivo / Exportar. El cuadro de diálogo Exportar aparece.

2.	Seleccione la ficha Personalizado.

Se pueden pasar formatos personalizados a otras fichas. Consulte más información en el archivo Asciiexp.dat.

Use la ficha Personalizado:

  exportar archivos de datos en un formato personalizado

  añadir nuevos formatos para exportar personalizados

  editar formatos para exportar existentes personalizados

  eliminar formatos para exportar personalizados.

Se proporcionan los siguientes formatos personalizados:

  Puntos delimitados

  Puntos de anchura fija

  Nombre,Este,Norte,Elevación,Código

  Nombre,Latitud,Longtitud,Altura (grados decimales locales)

  Nombre,Latitud,Longtitud,Altura (grados decimales WGS-84)

  Nombre,Latitud,Longtitud,Altura,Código (local)

  Nombre,Latitud,Longtitud,Altura,Código (WGS-84)

  Nombre,Norte,Este,Elev,Lat,Long,Altura,Código (local)

  Nombre,Norte,Este,Elev,Lat,Long,Altura,Código (WGS-84)

  Nombre,Norte,Este,Elevación,Código

  Puntos en el camino

  Puntos – Replanteados

  Camino – Punto de Captura

  Camino – Detalles de la estaca

Los formatos definidos por el usuario aparecen en orden alfabético.

NOTA: Los valores exportados a un archivo ASCII siempre se escriben de forma estándar. Esto es, sin símbolo de agrupación de dígitos (separador de miles) y con un punto para las cifras decimales. No se usan las opciones Panel de control / Configuración regional / Número de Microsoft Windows.

Todos los formatos para exportar personalizados se escriben en el archivo Asciiexp.dat.


Diálogo Opciones biblioteca de caract. y atributos

Use este diálogo para configurar la versión de Trimble Survey Controller a la que está exportando.

Versión

Si selecciona una versión anterior a la versión 7.00, la casilla de verificación Exportar atributos en el diálogo Opciones para Seleccionar biblioteca de caract. y atributos no estará disponible. Esto se debe a que las primeras versiones no soportan atributos.


Diálogo Opciones para exportar AutoCAD

Use este diálogo para configurar la versión de AutoCAD a la que está exportando.

Formato datos

Seleccione el formato de salida de datos de las opciones disponibles:

  DWG (un archivo AutoCAD drawing binario)

  ASCII DXF (un archivo AutoCAD Data eXchange estándar)

  DXF binario (un archivo AutoCAD Data eXchange estándar con formato binario)

NOTA: El formato de datos está determinado por sus requisitos (o los de su cliente).

Versión

Seleccione la versión de AutoCAD apropiada para el archivo para exportar. Esta se determina por el sistema al que vaya a exportar.

Prototipo de dibujo

Use este campo para referenciar un prototipo de dibujo AutoCAD del cual desea heredar definiciones de bloque para usarlas en archivos *.dxf y *.dwg creados por el sistema.

A medida que Trimble Geomatics Office crea un archivo AutoCAD, el software trata de hacer coincidir los nombres de los símbolos utilizados en el proyecto con los bloques definidos en el prototipo de dibujo especificado. Cualquier espacio en los nombres del símbolo se hace coincidir con subrayados en los nombres de bloque de AutoCAD.

Cuando un nombre de símbolo coincide con un nombre de bloque en el prototipo de dibujo, se insertará el bloque correspondiente en el archivo para exportar con la escala y rotación requeridas. Cualquier símbolo que no pueda hacerse coincidir con un bloque del prototipo del dibujo se insertará como un punto. Un prototipo de dibujo suministrado (SYMBOLS.DXF) incluye definiciones de bloque para todos los símbolos por defecto que provee el sistema.

NOTA: Las definiciones de bloque en el prototipo de dibujo se interpretan como de 200 unidades por 200 unidades, donde las unidades son aquellas que se muestran en el momento de exportar. La definición de 200-por-200 debe coincidir con la cuadrícula usada por la utilidad  Editor de Símbolos y Líneas de Trimble. Si desea construir su propio prototipo de dibujo con definiciones de bloque, asegúrese de que los bloques estén basados en una definición de 200-por-200 para obtener una escala correcta de los símbolos.

Examinar

Haga clic en Examinar para examinar el sistema y buscar los archivos de AutoCAD que requiera.


Diálogo Definir formato para exportar ASCII

Utilice este diálogo para definir los formatos ASCII para exportar.

Nombre

Introduzca el nombre del formato para exportar. Este nombre aparece en la lista Tipos en la ficha Personalizado del diálogo Archivo / Exportar. No se permiten los nombres duplicados.

Cadena nula

Introduzca la cadena nula para la definición del formato para exportar. Este campo es opcional. Cada vez que encuentra un campo de la base de datos que no tiene un valor asignado al mismo, Trimble Geomatics Office saca la cadena nula especificada dentro del formato de archivo.

NOTA: algunos tipos de archivo pueden requerir una cadena particular tal como “99999.99”, “*****” ó similar. Al especificar la configuración, podrá requerir a Trimble Geomatics Office que utilice su preferencia.

Descripción

Introduzca una descripción del formato para exportar. Esta aparecerá en la barra de estado. Este campo es opcional.

Extensión por defecto

Introduzca la extensión de archivo para el formato para exportar. Por ejemplo, dat o fbk. Este campo es opcional y si se lo omite, se supondrá que es “.txt”.

NOTA: Trimble Geomatics Office especifica la extensión en el campo Guardar archivo de tipo en el diálogo Guardar como. El nombre para el nuevo archivo puede introducirse en el campo Nombre de archivo. Se mostrarán los archivos con la extensión adecuada en la carpeta seleccionada para que se los pueda sobrescribir si fuera necesario. Trimble Geomatics Office automáticamente adopta un punto en una extensión.

Exportar desde

Seleccione una de las tablas o consultas principales como el origen del(de los) archivo(s) para exportar. El origen por defecto es registros de punto. Esto le permitirá exportar los registros de la tabla de puntos.

Rellenar formato automáticamente

Haga clic en Rellenar formato automáticamente para inicializar automáticamente la cabecera y el cuerpo, para obtener más información, consulte  Rellenar formato automáticamente.

Cabecera del formato

Introduzca el texto, las definiciones de código de campo o ambos (del menú abreviado) que Trimble Geomatics Office usará para crear una parte fija inicial del archivo para exportar. Este campo es opcional.

Consulte los detalles completos de todos los códigos de campo disponibles en el sistema en Códigos de campo − Visión de conjunto.

Para añadir líneas en blanco en la definición de cabecera presione Enter.

Cuerpo del formato

Introduzca la definición de código de campo adecuada (del menú abreviado) para indicar los datos que Trimble Geomatics Office va a exportar de la base de datos. En este campo debe introducirse una definición de salida. Si los datos para una única entidad se van a exportar en líneas múltiples, utilice la definición. Para hacerlo, presione la tecla Enter para iniciar una nueva línea de definición.

NOTA: Consulte más información sobre todos los códigos de campo disponibles en el sistema en Códigos de campo − Visión de conjunto.

Pie del formato

Introduzca (del menú abreviado) el texto, las definiciones del código de campo o ambos que Trimble Geomatics Office usará para crear la parte fija final del archivo para exportar. Este campo es opcional.

Consulte los detalles completos sobre todos los códigos de campo disponibles en el sistema en Códigos de campo − Visión de conjunto.

Para añadir líneas en blanco a la definición del formato de archivo presione Enter.

Consulte ejemplos de la exportación ASCII personalizada en el tema Definir formato para exportar ASCII − Ejemplos.


Definir formato para exportar ASCII - Ejemplos
Definir formato para exportar ASCII − Ejemplos

Véase también

Estos ejemplos muestran cómo crear algunos formatos para exportar ASCII, suponiendo que la base de datos del proyecto tiene los siguientes puntos:

Nombre: 1000	Este: 534247.541	Norte: 263104.807	Elev: 10.118	Cód.: EST

Nombre: 1024	Este: 534220.249	Norte: 263104.249	Elev: 10.129	Cód.: BA

Nombre: 1025	Este: 534222.850	Norte: 263100.894	Elev: 10.133	Cód.: ARBOL

Nombre: 1026	Este: 534222.218	Norte: 263095.934	Elev: 10.136	Cód.: ARBOL

Nombre: 1027	Este: 534224.816	Norte: 263092.579	Elev: 10.140	Cód.: POSTE

Nombre: 1028	Este: 534228.398	Norte: 263089.101	Elev: 10.732	Cód.: VALLA

Nombre: 1041	Este: 534236.948	Norte: 263084.989	Elev: 11.054	Cód.: VALLA

Nombre: 1042	Este: 534237.326	Norte: 263087.964	Elev: 10.982	Cód.: VALLA

Nombre: 1087	Este: 534243.575	Norte: 263099.773	Elev: 10.154	Cód.: BA

Ejemplo 1

El formato para exportar:

Cabecera del formato:

Formato archivo Versión 1.50

Fecha: [$Fecha.sistema]

Proyecto: [$Proyecto.Nombre]

El cuerpo del formato:

[Nombre],[Este:0.3],[Norte:0.3],[Elevación:0.3],[Código característica]

Pie del formato:

[$Sistema.Acerca de]

Este cuerpo del formato produce el siguiente archivo para exportar (que adopta la fecha apropiada, las configuraciones de formato de fecha de Microsoft Windows y el nombre del proyecto):

Formato archivo Versión 1.50

Fecha: 8/11/96

Proyecto: Ejemplo

1000,534247.541,263104.807,10.118,EST

1024,534220.249,263104.249,10.129,BA

1025,534222.850,263100.894,10.133,ARBOL

1026,534222.218,263095.934,10.136,ARBOL

1027,534224.816,263092.579,10.140,POSTE

1028,534228.398,263089.101,10.732,VALLA

1041,534236.948,263084.989,11.054,VALLA

1042,534237.326,263087.964,10.982,VALLA

1087,534243.575,263099.773,10.154,BA

Trimble Geomatics Office, Versión 1.50

Ejemplo 2

El formato para exportar:

Sin cabecera de formato

El cuerpo del formato:

[Nombre:4][Este:12.3][Norte:12.3][Elevación:12.3] [Código característica]

El cuerpo del formato produce el siguiente archivo para exportar:

1000  534247.541  263104.807      10.118 EST

1024  534220.249  263104.249      10.129 BA

1025  534222.850  263100.894      10.133 ARBOL

1026  534222.218  263095.934      10.136 ARBOL

1027  534224.816  263092.579      10.140 POSTE

1028  534228.398  263089.101      10.732 VALLA

1041  534236.948  263084.989      11.054 VALLA

1042  534237.326  263087.964      10.982 VALLA

1087  534243.575  263099.773      10.154 BA

NOTA: Trimble Geomatics Office supone que se inserta una nueva línea al final de la cabecera y del cuerpo. Para añadir una nueva línea (o nuevas líneas), presione Enter. El punto de inserción se moverá una línea hacia abajo, volverá al margen izquierdo, y creará una línea en blanco para que usted inserte el nuevo texto.


Opción Formato SDMS

El formato Sistema de administración de datos topográficos (Survey Data Management System) (SDMS), definido por la Asociación Americana de Autoridades de Transporte y Autopistas (“American Association of State Highway and Transportation Officials”) (AASHTO), consiste en un formato especial para datos topográficos. Los datos se exportan con este formato de Trimble Geomatics Office.

Esta opción exporta puntos y notas de atributo. Dichas notas pueden contener características de punto adicionales. Dichas notas de atributo se introducen en el dispositivo que ejecuta Trimble Survey Controller durante un levantamiento. La función especial de notas de atributo de Trimble Survey Controller ayuda en este aspecto. Adicionalmente, cualquier registro de nota introducido con un identificador de dos caracteres seguido de dos puntos (:) o de un espacio y a continuación los detalles de atributo se exportan a un archivo SDMS.

Por ejemplo, una nota que contiene I0:información ó I0 información se exporta a un archivo SDMS como I0:información donde ‘información’ es el texto asociado con el identificador l0 de SDMS.

Para que las notas de atributo estén asociadas con los puntos correctos en el archivo SDMS creado, durante la exportación debe elegir el conjunto de selección, creado automáticamente cuando se ha importado el archivo *.dc Trimble Survey Controller al proyecto. Dicho conjunto de selección retiene todos los datos (incluyendo las notas registradas) en el orden del levantamiento tal y como se encuentran en el archivo .dc.


Filtros externos - Visión de conjunto
Filtros externos − Visión de conjunto

Trimble Geomatics Office suministra la opción para añadir filtros para importar y exportar externos. Dichos filtros se pueden escribir independientemente del programa del sistema principal como bibliotecas de vínculos dinámicos (Dynamically Linked Libraries) (.dll’s) con funciones exportadas específicas. Los archivos .dll se deben crear como módulos de vinculación e integración (Linking and Embedding) (OLE). Dichos módulos también se conocen como objetos del Módulo de objeto componente (Component Object Module) (COM).

Las siguientes funciones exportadas se deben proporcionar en un filtro externo:

Función GetGUID

Declaración de función Pascal:	función GetGUID: TGUID; stdcall; export;

Declaración de función C/C++:	GUID __stdcall __export GetGUID()

Esta función debe devolver el identificador único de clase OLE (GUID - Globally Unique Identifier) que se ha asignado al programa. Este identificador único se obtiene utilizando un programa apropiado que genera identificadores únicos generalmente basándose en información como la hora y fecha de la computadora y cualquier ID de tarjeta de red o información parecida. La idea es que el ID sea único en el mundo y se piensa que se va a lograr usando números suficientemente grandes (consisten en 32 dígitos) que estadísticamente sean imposibles de encontrar al azar con el mismo valor. Un ejemplo de GUID es 07F750A3-594B-11D1-8E4C-0000C04FCAF9.

Función Convertir

Declaración de función Pascaln:	función Convertir(const FileName: WideString): WordBool;

Declaración de función C/C++ :	BOOL __stdcall __export Convert(BSTR FileName)

Esta es la función que realiza el trabajo real del filtro. El programa del filtro debe diseñarse para convertir datos de un archivo de origen a los datos de formato apropiados almacenados en el archivo de destino. Esta función permite que Trimble Geomatics Office especifique el nombre del archivo de destino que el filtro va a crear. En el caso de un filtro para importar, Trimble Geomatics Office espera que el filtro presente un diálogo Archivo / Abrir estándar permitiendo la selección del archivo de origen. El nombre del archivo de destino, definido por el sistema para que sea creado por el programa del filtro, se pasa a este último mediante la función Convertir. El archivo que el programa del filtro para importar ha creado debe estar en un formato de archivo .dc válido (formato de archivo Survey Controller o SDR).

Con un filtro para exportar, Trimble Geomatics Office espera que el filtro presente un diálogo Archivo / Guardar estándar permitiendo la selección del archivo de destino. Trimble Geomatics Office crea un archivo de origen para el filtro de acuerdo con el formato de archivo definido en la función Formato que se comenta más adelante. El nombre del archivo de origen se pasa a la función Convertir de forma que el filtro sepa con qué archivo trabajar. Trimble Geomatics Office extrae los datos de la base de datos de acuerdo con los criterios del conjunto de selección definidos para la operación de exportación. La definición del código de campo, tal y como está definida en la función Formato, controla el formato de los datos que Trimble Geomatics Office ha escrito al archivo de origen. El programa de filtros para exportar debe leer el archivo de origen, convertir los datos al formato para exportar apropiado, y a continuación escribirlo en el archivo de destino especificado.

Función GetLongDesc

Declaración de función Pascal:	función GetLongDesc: WideString; safecall;

Declaración de función C/C++:	BSTR __stdcall __export GetLongDesc()

Esta función se utiliza para proporcionar el texto que se muestra en la barra de estado de Trimble Geomatics Office cuando la opción importar o exportar filtro está resaltada en el diálogo Importar o Exportar. La definición de esta función es opcional y si no se define, cuando se resalta la opción Filtrar, no se mostrará nada en la barra de estado.

Función GetShortDesc

Declaración de función Pascal: 	función GetShortDesc: WideString; safecall;

Declaración de función C/C++ :	BSTR __stdcall __export GetShortDesc()

Esta función se utiliza para suministrar el texto para el nombre del filtro para importar o exportar que se muestra en el diálogo Importar o Exportar en Trimble Geomatics Office permitiendo la selección del filtro.

Función Formato

Declaración de función Pascal:	 	función Formato: WideString; safecall;

Declaración de función C/C++:	BSTR __stdcall __export Format()

Esta función sólo se requiere en los programas del filtro para exportar y permite que el programa especifique el formato del archivo de origen que Trimble Geomatics Office va a crear. La cadena de texto que esta función produce debe consistir en códigos de campo válidos de Trimble Geomatics Office. Si no hay una función Formato definida en un programa del filtro para exportar, Trimble Geomatics Office adopta un formato de ‘[Nombre],[Norte],[Este],[Elevación],[Código característica]’ creando así un archivo con los valores Nombre, Norte, Este, Elevación y Código característica separados por coma que el filtro para exportar va a leer.


Opción Archivos de datos GPS (*.dat)

Un archivo .dat contiene datos brutos GPS de un receptor GPS. Dichos archivos pueden incluir datos cinemáticos con posprocesamiento y datos estáticos. Los archivos .dat GPS no contienen ninguna información sobre el sistema de coordenadas.

Un archivo .dat se puede transferir a un proyecto de Trimble Geomatics Office desde:

  Trimble Survey Controller (con archivo .dc)

  un receptor GPS topográfico de Trimble

  una computadora

NOTA: Si importa un archivo .dat más de una vez al mismo proyecto, las ocupaciones existentes en la base de datos del proyecto no se seleccionarán por defecto en el diálogo Entrada DAT (Comprobar DAT).


Opción Archivos RINEX

El formato Receiver INdependent EXchange (Intercambio Independiente del Receptor) (RINEX) es un formato de archivo de datos brutos GPS estándar utilizados para intercambiar archivos de varios fabricantes de receptores.

Para usar este formato, necesitará los siguientes archivos en la computadora:

Archivo RINEX	Extensión de archivo	Opcional
Archivo de datos de observación	*.obs, *.Xxo	−
Archivo de mensaje de navegación	*.nav, *.XXn	−
Archivo meteorológico	Archivo *.met o *.XXm	Estos archivos son opcionales.
Para importar archivos RINEX en su computadora a Trimble Geomatics Office lleve a cabo cualquiera de las siguientes acciones:

  Use el cuadro de diálogo Importar y seleccione los archivos RINEX  (*.obs, *.??o).

  Use la función de arrastrar/colocar envío.

Seleccione el (los) archivo(s) de datos de observación. Si los archivos de navegación y observación no tienen el mismo nombre, puede emparejar los archivos de navegación y observación en el cuadro de diálogo de Emparejamiento de Archivos de Navegación. Navegue al archivo .nav de emparejamiento o selecciónelo de la lista de archivos de Navegación.

El diálogo Comprobar DAT aparecerá cuando pueda comprobar los valores en los archivos antes de importar las observaciones GPS. Verifique que ni el tipo de antena ni el tipo de receptor sean “desconocidos”.

Cuando se transfieren los archivos RINEX y todas las observaciones GPS se importan a la base de datos del proyecto, se crea un conjunto de selección con el mismo nombre que el archivo RINEX.

Al importar los archivos RINEX a un proyecto de Trimble Geomatics Office, este ultimo se podrá usar para procesar las líneas base GPS (si tiene instalado el módulo Procesamiento de líneas base) y usar el módulo Timeline para ver las observaciones brutas GPS (si tiene instalado el módulo Procesamiento de líneas base).


Clases de Survey Controller y cómo se las maneja en Trimble Geomatics Office

Cuando se crean puntos en Trimble Survey Controller, se les asigna una clase de punto. Al importar puntos a un proyecto, Trimble Geomatics Office utiliza dicha clase y el método empleado para determinar la posición del punto para asignar una calidad de punto al punto. Un recálculo utiliza la calidad para determinar la posición calculada para el punto.

La siguiente tabla muestra las clases que Trimble Survey Controller otorga a los puntos y cómo Trimble Geomatics Office los maneja al importarlos.

Clase	Descripción	Lo que sucede al importar
Control	Una clase control es la calidad más alta que se puede asignar a un punto en Trimble Survey Controller.	Se importan como coordenadas de control para el punto.
Normal	Se asigna una clase normal a todos los puntos medidos además de los puntos replanteados. También se puede asignar esta clase a los puntos tecleados.	Se importan las observaciones y coordenadas para el punto. Se les asigna calidad de levantamiento a las Coordenadas.
Replanteo	Se asigna una clase replanteo a los puntos medidos durante el replanteo.	Se importan las observaciones y los detalles de replanteo para un punto. Se pueden ver los detalles de Recién Replanteados en la ventana de Propiedades de la ficha de Replanteo.
Referencia	Se asigna una clase referencia a los puntos definidos como un punto de referencia en el campo.	Una clase referencia se trata de la misma forma que una clase normal en Trimble Geomatics Office.
Comprobación	Se asigna una clase comprobación a una observación de comprobación o a una posición tecleada como un punto duplicado y almacenada como un punto de comprobación.	Se importan las observaciones con la clase “habilitada como comprobación”.
Eliminado	Se asigna una clase eliminado a un punto sobrescrito o eliminado en Trimble Survey Controller.	Los puntos con la clase eliminado no se importarán al proyecto de Trimble Geomatics Office. Se encontrará una lista de los puntos eliminados en el archivo .dc en el informe creado al importar el archivo.


Calidades asignadas a las coordenadas y observaciones De un Archivo .dc usando clases del Survey Controller

Cuando las posiciones GPS se almacenan en Trimble Survey Controller, las mismas pueden derivar de diferentes técnicas de mediciones o de tecleo de coordenadas. La calidad otorgada al punto depende del método de observación o de la calidad asignada al punto al teclearlo.

La siguiente tabla muestra las calidades asignadas a las coordenadas que usan las clases de Trimble Survey Controller.

Método de coordenadas	Calidad asignada
Tecleadas de control	Control
Tecleadas normales	Topográfica
RTK fijo	Topográfica
RTK flotante	Cartográfica
Código L1	Cartográfica
Autónomas	Desconocida
WAAS	Cartográfica
Wide area fija	Topográfica
Wide area flotante	Cartográfica
Código RTCM	Cartográfica
Copiadas	Calidad del punto copiado
NOTA: Para los archivos .dc de Trimble Survey Controller versión 7.5 ó posterior, se ha utilizado la tecla Aquí para determinar la posición de la base, se escribirá un método Autónomas y la posición se importará con una calidad desconocida. Esto significa que todos los puntos medidos de la base tendrán una calidad desconocida.

Si ha realizado una calibración local GPS y está seguro de los resultados, podrá incrementar la calidad de la base a medir y a todos los puntos medidos de la base se les asignará esta calidad.

Para las versiones de archivos .dc de Trimble Survey Controller anteriores a la versión 7.5, si utiliza la tecla Aquí para determinar la posición de la base, a dicha posición se le asignará la calidad Topográfica.

La siguiente tabla muestra las calidades asignadas a observaciones usando las clases de Trimble Survey Controller.

Método de observación	Calidad asignada
Convencional	Topográfica
Telémetro de láser	Cartográfica
L1 fijo	Topográfica
L1 flotante	Cartográfica
Código L1	Cartográfica


Importando Archivos Leica GSI-16

Cuando importe archivos con formato Leica GSI-16, Trimble Geomatics Office sólo lee los Bloques de Medición y las palabras de los comentarios asociados a estos bloques. La operación de importación usa Palabras (registros) específicas y disponibles para la información de las estaciones. Los siguientes Indices de Palabras son leídos e interpretados durante la operación de importación:

Indice	Significado	Indice	Significado
11	Identificación de Punto (Identificador de bloque de medición)	82	Norte del punto
21	Angulo horizontal	83	Elevación del punto
22	Angulo Vertical	84	Este de la estación
31	Distancia de la pendiente	85	Norte de la estación
32	Distancia Horizontal	86	Elevación de la estación
33	Distancia Vertical	87	Altura del reflector
71…7 9	Palabras de comentarios (usadas para códigos y notas)	88	Altura del instrumento
81	Este del punto
En base a estos Indices de Palabras, Trimble le recomienda que configure los siguientes registros de máscara de datos de estación y medición en su instrumento Leica:

Máscara para Datos de Estación	Máscara para Datos de Medición
Identificación de Punto (11)	Identificación de Punto (11)
Este de la estación	Angulo horizontal (21)
Norte de la estación (85)	Angulo Vertical (22)
Elevación de la estación (86)	Distancia de la pendiente (31)
Altura del instrumento (88)	Constante de ppm y de prisma (51)
Código (71)	Altura del reflector (87)
Nota (72)	Código (71)
	Nota (72)
NOTA: Durante la importación, el software supone que la primera observación registrada después de un registro de estación es una observación al punto visual hacia la referencia. La primera palabra de comentario (71) se interpreta como el código del punto, y cualquier otra palabra de comentario (72…79) es interpretada como registro de Notas.


Opción Archivos de nivel digital (*.dat, *.raw)

Los archivos de Nivel Digital contienen datos que han sido guardados en un nivel digital.

Son aceptados los archivos de datos de los siguientes niveles digitales:

  Nivel digital DiNi de Trimble

  Leica NA 2002/3003

Cuando se importa un archivo de Nivel Digital el cuadro de diálogo de Importar nivel digital aparece.

NOTA: Deberá transferir archivos de datos de un nivel digital DiNi de Zeiss con el formato M5.


Exportar Bluebook NGS

La opción Exportar Bluebook NGS le permite generar archivos standard de tipo Bluebook National Geodetic Survey (NGS) desde Trimble Geomatics Office.

Los archivos Bluebook son definidos por el gobierno de Estados Unidos y son requeridos para los levantamientos que se someten al sistema “National Spatial Reference System”. Las reglas para este tipo de levantamiento están contenidas en un libro azul (blue book), por lo que, al proceso de someter al sistema estos levantamientos se le conoce como “bluebooking”.

La utilidad de Bluebook NGS crea los siguientes archivos de tipo Bluebook para líneas base GPS:

  NGS

  B –información de proyecto

  G –información de línea base

  SERFIL – un archivo  ASCII que contiene la estación SSN, ID, y los nombres de estaciones de un proyecto existente

El cuadro de diálogo de archivos Bluebook NGS usa datos asociados con el conjunto seleccionado de líneas bases independientes y procesadas en el proyecto. Antes de exportar los archivos NGS, debe completar todo el trabajo de terreno, procesamiento, y control de calidad. Una vez que haya seleccionado líneas base y haya iniciado la exportación, no va a poder agregar más líneas base al cuadro de diálogo de Bluebook (libro azul) sin haber empezado el proceso de exportación nuevamente.

NOTA: Para una descripción de los datos requeridos en cada campo del cuadro de diálogo  Exportar Bluebook NGS, refiérase a “Formatos de entrada y especificaciones de la base de datos de National Geodetic Survey (NGS)”. La referencia a NGS está disponible en: http://www.ngs.noaa.gov/FGCS/BlueBook/


Cuadro de diálogo para Archivos Bluebook NGS

El filtro Exportar Bluebook NGS le permite generar archivos estándar del tipo Bluebook National Geodetic Survey (NGS) desde Trimble Geomatics Office.

El cuadro de diálogo Archivos Bluebook NGS usa datos asociados con la selección del conjunto de líneas base, procesadas en forma independiente, en el proyecto. Antes de exportar los archivos NGS, debe completar todo el trabajo de terreno, procesamiento, y control de calidad. Una vez que haya seleccionado líneas base y haya iniciado la exportación, no va a poder agregar más líneas base en el cuadro de diálogo Archivos Bluebook NGS (la única forma de hacerlo es iniciando el proceso de exportación nuevamente).

Para acceder al cuadro de diálogo Archivos Bluebook NGS:

1.	Seleccione Archivo / Exportar. El cuadro de diálogo Exportar aparecerá.

2.	En la ficha de Levantamiento, seleccione archivos Bluebook NGS.

NOTA: Se le preguntará si desea abrir la información previamente guardada si antes había guardado una sesión de Bluebook.

Para introducir información acerca del proyecto use las fichas en cuadro de diálogo Exportar Bluebook NGS.

Ficha de proyecto

Esta ficha contiene información general acerca del proyecto.

Ficha de estación

Esta ficha contiene una lista con todas las estaciones asociadas a las líneas base seleccionadas:

  Ingrese la identificación (ID 4 caracteres) y la estación (SN) usando los botones de Generar-Automáticamente. La identificación (ID) se genera usando los primeros cuatro caracteres del nombre de la estación. Los SN son generados en forma secuencial empezando desde 0001 o desde el primer número disponible.

  La columna de Estado/País se ingresa automáticamente con la información en la ficha del Proyecto.

  Seleccione el orden de la lista.

  Como todos los datos de tipo Bluebook se originan de métodos de recolección GPS, la columna Tipo queda automáticamente por defecto a un Esquema Principal de Posicionamiento Relativo Satelital A-Interferométrico.

  Para importar los ID de 4 caracteres y los SN de las estaciones existentes usando un SERFIL de un proyecto previo, use el botón SERFIL. El SERFIL debe contener el nombre de la estación para cada estación. Este formato es un poco diferente al formato NGS SERFIL pero el NGS puede seguir usando el archivo. El siguiente formato debe ser usado:

ID de 4 caracteres   	SN de Estación    	Nombre de la Estación

COWB   	0004  	 	COWBOY

Ficha Información de la Sesión

Esta ficha contiene información acerca de cada sesión de terreno para las líneas base seleccionadas. Los colores alternados representan individualmente a cada sesión de línea base.

  La Hora de Inicio representa la última hora de inicio para todos los receptores en la sesión y no puede representar la hora de inicio para cada una de las líneas base. La Hora será usada sólo como una referencia cuando se emparejen las sesiones a las hojas de terreno.

   La columna del receptor se llena automáticamente con el tipo de receptor y su número de serie.

   La columna de Antena se llena automáticamente con el tipo de antena. Sin embargo, debe introducir el número de serie. Una vez que el SN de cada antena haya sido ingresado, éste se puede seleccionar de una lista en un menú desplegable.

  La columna de Altura de Antena (Metros/APC L1) se llena automáticamente con la medida vertical verdadera al centro de la fase L1 (la cual se calcula con la altura de antena ingresada en terreno o durante el ingreso).

Ficha de Pre Sesión de Clima y Post Sesión de Clima

Las fichas de Pre y Post Sesión de Clima contienen información acerca del clima para cada ubicación asociada a las líneas base seleccionadas. Los campos son requeridos cuando se lleva a cabo un levantamiento tipo B o superior. El asterisco se quita automáticamente de la ficha de encabezamiento cuando el levantamiento de primer orden se selecciona en la ficha del proyecto.

Este campo …	por defecto a …
Bulbo seco	Celsius
Bulbo húmedo	Celsius
Humedad	Porcentaje
Presión	Milibares
  El campo de Código de Clima se rellena al introducir directamente el código o usando el botón Editar Campo Actual.

  El botón Editar Campo Actual le permite ver y seleccionar los códigos de acuerdo a la descripción de cada variable.

  El campo de Copiar a la Pre- (Post) Sesión de Clima se usa para copiar los mismos datos desde la ficha de Pre- a la ficha de Post-Sesión de Clima y vice versa.

Ficha de Misceláneo

La ficha de misceláneo contiene información general acerca del procesamiento.

Equipo

El botón de Equipo le permite ver, agregar, y editar información acerca de cada receptor y cada antena. Sólo se lista el equipo relacionado con el proyecto.

OK

El botón OK cierra el cuadro de diálogo de Archivos Bluebook NGS y guarda la información en cada ficha. Cuando ingresa una gran cantidad de datos usted puede guardar su trabajo y volver a él más tarde.

Exportar

El botón de Exportar está disponible después de que se han llenado todos los campos requeridos. El botón de Exportar le permite introducir un nombre y seleccionar una ubicación para cada archivo. La ubicación por defecto es Trimble Geomatics Office\Proyectos\<Nombre del proyecto>\Exportar.

NOTA: A medida que cada campo en cada ficha se va llenando, el * junto a su nombre se va quitando. Cuando no quedan más campos por completar en el cuadro de diálogo, el botón  Exportar queda disponible.

NOTA: Para una descripción de los datos requeridos para cada campo del cuadro de diálogo Exportar Bluebook NGS, refiérase a “Formatos de entrada y especificaciones de la base de datos de National Geodetic Survey (NGS) ”. La referencia a NGS está disponible en: http://www.ngs.noaa.gov/FGCS/BlueBook/


Formato Trimble Data Exchange

 Cómo

El Formato Trimble Data Exchange ha sido diseñado por Trimble Navigation Limited para hacer lo siguiente:

  Transferir datos topográficos desde proyectos de Trimble Geomatics Office

  Exportar datos topográficos a otras aplicaciones para ajustes de la red u otras operaciones geodésicas.

NOTA: Revise que el proveedor del software de ajuste de la red acepte este formato.

Para importar o exportar datos usando este formato, seleccione la opción Formato Trimble Data Exchange en los cuadros de diálogo Importar o Exportar.

La siguiente información se guarda en un archivo ASCII:

Estaciones y coordenadas	Vectores GPS
Observaciones Terrestres	Observaciones Láser
Información de Nivel	Información de Acimut
El archivo está organizado en las siguientes secciones:

[General]

Esta sección le proporciona información general acerca de los contenidos del archivo del proyecto y las unidades usadas en los distintos campos.

[Estaciones]

Esta sección incluye el nombre y las coordenadas de todos los puntos seleccionados para transferencia. Las coordenadas en esta sección siempre están en el datum local. Cada observación se almacena en los registros de estación, que incluyen latitud, longitud, Norte, y Este. La altura elipsoidal o la altura ortométrica pueden también aparecer en cada registro.

El registro de estaciones también contiene información acerca de qué componentes de coordenadas están identificados como control, y la característica de código asignado a cada estación.

[GPS]

Esta sección incluye los vectores GPS de las líneas base seleccionadas para transferencia. Cada observación queda almacenada en los registros vectoriales, que incluyen:

Los nombres de estación: Desde y hasta	Componentes vectoriales
Información de Covarianza	Alturas de antena
Tipo de procesamiento	Proporción
RMS	Varianza de referencia
Fecha y Hora de las observaciones
[Terrestre]

Esta sección incluye las observaciones terrestres seleccionadas para la transferencia. Las  observaciones individuales se encuentran en los registros TerrObs que incluyen:

Punto del Instrumento	Punto visual hacia la referencia
Punto visual hacia la medición (mirada adelante)	Angulo horizontal y error
Angulo vertical y error	Distancia de pendiente y error
Constante del prisma	Altura del Instrumento
Fecha y hora de la observación (si está disponible)	Altura de objetivo
[Láser]

Esta sección incluye las observaciones con láser seleccionadas para transferencia. Las observaciones individuales se encuentran en registros de tipo LáserObs que incluyen:

Punto del Instrumento	Declinación Magnética
Acimut Magnético	Distancia de pendiente
Angulo Vertical	Altura de objetivo
Altura del Instrumento	Punto del objetivo
Fecha y hora de la observación (si está disponible)
[Nivel]

Esta sección incluye observaciones de nivel seleccionadas para transferencia. Las observaciones individuales están contenidas en registros de tipo LevelObs que incluyen:

Puntos al comienzo y término del conjunto de mediciones con nivel	Incremento elevación y error
Distancia (si está disponible)	Número de giros (si está disponible)
Fecha y hora de la observación (si está disponible)
[Acimut]

Esta sección incluye registros que contienen observaciones individuales de acimut.

NOTA: Al exportar archivos con formato Trimble Data Exchange de Trimble Total Control, Trimble Geomatics Office importará datos solamente de la sección de coordenadas tecleadas. En este caso, las coordenadas con calidad de control o ajustadas se importarán con la calidad de control.


Archivos de proyecto de Terramodel (*.pro)

Trimble Geomatics Office soporta el formato de archivos de proyecto de Terramodel (*.pro).

Use Trimble Geomatics Office para importar un archivo de proyecto de Terramodel (*.pro) a un proyecto de Trimble Geomatics Office:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha CAD / ASCII.

3.	Seleccione la opción Archivos de proyecto de Terramodel (*.pro).

Aparecerá el diálogo Abrir.

4.	Seleccione el archivo a importar y haga clic en Abrir.

NOTA: Sólo se importarán puntos, líneas y capas de archivos de proyecto de Terramodel (*.pro).


Software TDS - Visión de conjunto

Véase también

Trimble Geomatics Office soporta archivos del siguiente software TDS:

  TDS Survey Pro CE

  que se ejecuta en un TDS 3600

  que se ejecuta en un TDS 5600

Se podrán importar y exportar archivos TDS del PC o se los podrá transferir directamente al o del software TDS utilizando las opciones para importar y exportar de Dispositivo topográficos.

NOTA: Trimble Geomatics Office no soporta archivos de control TDS. Los puntos deberán importarse de los archivos de control utilizados en el trabajo principal antes de transferir los archivos. Consulte más información en la documentación de TDS.

NOTA: Trimble Geomatics Office no soporta características y atributos de TDS.

TDS Survey Pro CE

Trimble Geomatics Office soporta los siguientes archivos de TDS Survey Pro CE:

Nombre	Extensión	Para importar	Para exportar	Descripción
Trabajo	*.job			Contiene puntos e información sobre coordenadas. Importe un archivo de trabajo (*.job) cuando solamente quiere importar puntos de un proyecto de TDS Survey Pro CE.
Bruto	*.raw		X	Contiene información de observación. Importe un archivo bruto (*.raw) cuando quiere importar tanto puntos como observaciones de un proyecto de TDS Survey Pro CE.
Descripción	*.txt	X		Archivo de texto sencillo de los códigos de característica que le ayuda a introducir descripciones de punto en TDS Survey Pro CE.
Cuadrícula de geoide	*.ggf	X		Separaciones del elipsoide de referencia WGS84 (TDS Survey Pro CE versión 3.5 ó posterior)

Para exportar:

  una definición vial (*.job, *.rd5, *.tp5) de RoadLink, consulte la ayuda de RoadLink.

  un MDT (*.dtm) de DTMLink, consulte la ayuda de DTMLink.

Consulte más información sobre dichos archivos en la documentación de TDS.

Trimble Geomatics Office también provee soporte de sistemas de coordenadas para todas las versiones del software TDS Survey Pro CE. Ello incluye el soporte para la función geodésica mejorada disponible en TDS Survey Pro CE 3.5 ó posterior, cuando se emplea con un receptor GPS de Trimble. Los archivos importados de TDS Survey Pro CE contienen una definición completa del sistema de coordenadas, idéntica a la del archivo Survey Controller (*.dc).

NOTA: Las observaciones GPS sólo se importan de TDS Survey Pro CE 3.5 ó posterior cuando se emplea con un receptor GPS de Trimble. En todas las versiones, se soportan las observaciones terrestres de cualquier marca de estación total.

Trimble 3600/5600 TDS

Trimble Geomatics Office soporta los siguientes archivos del software Trimble 3600/5600 TDS:

Nombre	Extensión	Para importar	Para exportar	Descripción
Coordenada	*.cr5			Contiene puntos e información sobre coordenadas. Importe un archivo de coordenadas (*.cr5) cuando solamente quiere importar puntos de un proyecto de Trimble 3600/5600 TDS.
Bruto	*.rw5		X	Contiene información de observación. Importe un archivo bruto (*.rw5) cuando quiere importar tanto puntos como observaciones de un proyecto de Trimble 3600/5600 TDS.
Descripción	*.txt	X		Archivo de texto sencillo de los códigos de característica que le ayuda a introducir descripciones de punto en TDS Survey Pro CE.
Para exportar:

  una definición vial (*.cr5, *.rd5, *.tp5) de RoadLink, consulte la ayuda de RoadLink.

  un Modelo digital del terreno (*.dtm) de DTMLink, consulte la ayuda de DTMLink.

  Consulte más información sobre dichos archivos en la documentación de TDS.

Los archivos importados del software Trimble 3600/5600 TDS no contienen definiciones completas del sistema de coordenadas. Los archivos se importan utilizando sistemas de coordenadas de escala solamente, al igual que los archivos Survey Controller (*.dc).

Al importar archivos, Trimble Geomatics Office define el sistema de coordenadas con el factor de escala más reciente utilizado en el trabajo de TDS Survey Pro CE.

NOTA: Al importar archivos de coordenadas de Trimble 3600/5600 TDS, Trimble Geomatics Office importa el archivo de coordenadas (*.cr5), y luego importa datos del archivo bruto asociado (*.rw5) si está en la misma carpeta en la computadora. Si únicamente quiere importar coordenadas, asegúrese de que en la misma carpeta de la computadora no exista un archivo bruto con el mismo nombre que el archivo de coordenadas que se está importando. Los archivos brutos también se pueden importar individualmente.


Archivo de trabajo de TDS Survey Pro CE (*.job)

Trimble Geomatics Office soporta datos con el formato del archivo de trabajo de TDS Survey Pro CE (*.job).

Use Trimble Geomatics Office para:

 Importar  un archivo de trabajo de TDS Survey Pro CE a un proyecto de Trimble Geomatics Office.

 Exportar un proyecto de Trimble Geomatics Office a un archivo de trabajo de TDS Survey Pro CE.

También puede transferir archivos directamente al y del software TDS Survey Pro CE utilizando las opciones para exportar e importar de Dispositivos topográficos.

Para importar un archivo de trabajo de TDS Survey Pro CE:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo de trabajo de Survey Pro CE Job (*.job) y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

4.	Seleccione el archivo a importar y haga clic en Abrir.

NOTA: El formato del archivo de trabajo de TDS Survey Pro CE contiene puntos y coordenadas asociadas. Use esta opción cuando solamente quiere importar puntos de un proyecto de TDS Survey Pro CE.

Para exportar el proyecto actual de Trimble Geomatics Office a un archivo de trabajo de TDS Survey Pro CE:

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo de trabajo de TDS Survey Pro CE (*.job) y haga clic en Aceptar.

Aparecerá el diálogo Guardar como.

4.	Seleccione una carpeta en la que se va a guardar el archivo.

5.	Introduzca un nombre en el campo Nombre de archivo y haga clic en Guardar.

NOTA: Si existen puntos duplicados en la selección que se está exportando, no se creará el archivo de trabajo de TDS Survey Pro CE. Asegúrese de que todos los puntos exportados tengan nombres únicos.


Archivo bruto de TDS Survey Pro CE (*.raw)

Use Trimble Geomatics Office para importar un archivo bruto de TDS Survey Pro CE a un proyecto de Trimble Geomatics Office. También podrá transferir archivos directamente del software TDS Survey Pro CE utilizando la opción para importar de Dispositivos topográficos. El formato del archivo bruto de TDS Survey Pro CE contiene toda la información en un proyecto de Survey Pro CE. Use esta opción cuando desea importar tanto puntos como observaciones de un proyecto de TDS Survey Pro CE.

Para importar un archivo brutos de TDS Survey Pro CE:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo bruto de TDS Survey Pro CE (*.raw) y haga clic en Aceptar.

Aparecerá el diálogo Abrir.

4.	Seleccione el archivo en una carpeta que quiere importar y haga clic en Abrir.


Archivos de coord de Trimble 3600/5600 TDS (*.cr5)

Use Trimble Geomatics Office para:

 Importar un archivo de coordenadas de Trimble 3600/5600 TDS a un proyecto de Trimble Geomatics Office.

 Exportar un proyecto de Trimble Geomatics Office a un archivo de coordenadas de Trimble 3600/5600 TDS.

También podrá transferir archivos directamente al y del software Trimble 3600/5600 TDS utilizando las opciones para exportar e importar de Dispositivos topográficos.

Para importar un archivo de coordenadas de Trimble 3600/5600 TDS:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos de coord de Trimble 3600/5600 TDS (*.cr5).

Aparecerá el diálogo Abrir.

4.	Seleccione el archivo a importar y haga clic en Abrir.

NOTA: Al importar archivos de coordenadas de Trimble 3600/5600 TDS, Trimble Geomatics Office importará el archivo de coordenadas, luego importará el archivo de datos bruto asociado (*.rw5) si está en la misma carpeta que la computadora. Si dicho archivo de datos bruto no está en la misma carpeta que el archivo de coordenadas elegido para importar, sólo se importarán puntos.

Para exportar el proyecto actual de Trimble Geomatics Office a un archivo de coordenadas de Trimble 3600/5600 TDS:

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

Seleccione la opción Archivo de coord de Trimble 3600/5600 TDS (*.cr5).

Haga clic en Aceptar.

Aparecerá el diálogo Guardar como.

5.	Seleccione la carpeta en la que se va a guardar el archivo.

6.	Introduzca un nombre en el campo Nombre de archivo y haga clic en Guardar.

NOTA: Si existen puntos duplicados en la selección que se está exportando, o un punto tiene un nombre alfanumérico, no se creará el archivo de coordenadas de Trimble 3600/5600 TDS. Asegúrese de que todos los puntos exportados tengan nombres únicos.


Archivos brutos de Trimble 3600/5600 TDS (*.rw5)

Use Trimble Geomatics Office para Importar un archivo de datos brutos de Trimble 3600/5600 TDS a un proyecto de Trimble Geomatics Office. También podrá transferir archivos directamente del software Trimble 3600/5600 TDS utilizando las opciones para exportar e importar de Dispositivos topográficos. El formato del archivo bruto de Trimble 3600/5600 TDS contiene casi toda la información en un proyecto de Survey Pro CE. Use esta opción cuando desea importar tanto puntos como observaciones de un proyecto de Trimble 3600/5600 TDS.

Para importar un archivo bruto de Trimble 3600/5600 TDS:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos brutos de Trimble 3600/5600 TDS (*.rw5).

Aparecerá el diálogo Abrir.

4.	Seleccione el archivo a importar y haga clic en Abrir.


Archivos de descripción TDS (*.txt)|

Los softwares TDS Survey Pro CE y Trimble 3600/5600 TDS usan archivos de descripción para automáticamente introducir descripciones para puntos que están almacenados en un trabajo. Consulte más información sobre archivos de descripción en la documentación de TDS.

Use Trimble Geomatics Office para:

 Exportar un archivo de descripción (*.txt) del Feature Code Editor (Editor de códigos de característica).

 Exportar un archivo de descripción (*.txt) existente al software TDS Survey Pro CE o Trimble 3600/5600 TDS.

 Exportar un archivo de descripción (*.txt) de una biblioteca de códigos de característica al software TDS Survey Pro CE o Trimble 3600/5600 TDS.

Para exportar un archivo de descripción del Feature Code Editor, consulte la ayuda del Feature Code Editor.

Para exportar un archivo de descripción existente al software TDS Survey Pro CE o Trimble 3600/5600 TDS:

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo de descripción a dispositivo TDS (*.txt) y haga clic en Aceptar.

Aparecerá el diálogo Seleccionar.

4.	Seleccione el archivo que quiere exportar y haga clic en Abrir.

Aparecerá el diálogo Guardar como.

5.	Seleccione un dispositivo TDS y haga clic en Abrir.

Se exportará el archivo.

Para exportar un nuevo archivo de descripción de una biblioteca de códigos de característica al software TDS Survey Pro CE o Trimble 3600/5600 TDS:

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Biblioteca de caract. y atributos al dispositivo TDS (*.txt) y haga clic en Aceptar.

Aparecerá el diálogo Seleccionar biblioteca de caract. y atributos.

4.	Seleccione la biblioteca a exportar y haga clic en Aceptar.

Aparecerá el diálogo Guardar como.

5.	Seleccione un dispositivo TDS y haga clic en Abrir.

Se exportará el archivo.


Zeiss - Visión de conjunto

Trimble Geomatics Office soporta archivos M5 de los siguientes instrumentos:

  Trimble 3300

  Trimble 3600 Elta

  Trimble 5600 Elta

  Trimble Elta GPS Controller

  Nivel digital DiNi de Trimble

Los archivos M5 se pueden importar o exportar del PC o se los puede transferir directamente al y del instrumento utilizando las opciones para importar y exportar de Dispositivos topográficos.

Trimble Geomatics Office soporta archivos de Zeiss según se detalla a continuación:

Formato de archivo	Soportado
Elta M5  (Idiomas inglés y alemán solamente)	Sí
Rec 500, R4 y R5	No.  El CD de Trimble Geomatics Office incluye un programa para la conversión entre los formatos de archivo M5 y Rec 500 si es necesario.
Elta Codelist	No

Exportar

Trimble Geomatics Office exporta nombres de puntos de cuadrícula, códigos, descripciones y coordenadas a archivos M5. No se exportan otros datos, como por ejemplo observaciones.

NOTA: Las coordenadas en el archivo exportado se escriben con el mismo número de cifras decimales que utiliza el proyecto de Trimble Geomatics Office, pero con un máximo de tres cifras decimales para el instrumento Trimble 3300 y de cuatro cifras decimales para los instrumentos Trimble 3600/5600 Elta y Trimble Elta GPS Controller.

Importar

NOTA: El formato de archivo M5 no soporta definiciones completas del sistema de coordenadas. Los archivos se importan utilizando sistemas de coordenadas de escala solamente, que equivale a la importación de un sistema de coordenadas de escala solamente en un archivo Survey Controller (*.dc). Se podrá teclear un factor de escala al definir el sistema de coordenadas para importar en Trimble Geomatics Office.

Unidades

Las unidades que tiene el formato M5 son "m" (para metros y metros de Namibia) o “ps” (para pies internacional o pies topográficos USA).

Al exportar a un archivo M5 o al importar del mismo, si el proyecto y el instrumento no están usando las mismas unidades, Trimble Geomatics Office supone que "m" en el archivo M5 son metros y que “ps” son pies internacionales.

Nivel digital DiNi de Trimble

NOTA: Trimble Geomatics Office no exporta al instrumento nivel digital DiNi de Trimble.

Véase más información sobre la importación de un instrumento nivel digital DiNi de Trimble en la opción para importar Archivos de nivel digital (*.dat, *.raw).


Archivos M5 de Trimble 3300/3600/5600 Elta (*.dat)

Use Trimble Geomatics Office para:

  Importar archivos M5 de Trimble 3300/3600/5600 Elta (*.dat) a un proyecto de Trimble Geomatics Office.

  Exportar un proyecto de Trimble Geomatics Office a un archivo de coordenadas M5 de Trimble 3300/3600/5600 Elta (*.dat).

También podrá transferir archivos directamente al y del software que se ejecuta en Trimble 3300, 3600 Elta ó 5600 Elta a través de las opciones para exportar e importar de Dispositivos topográficos.

Asegúrese de que las Opciones archivo M5 para los archivos de M5 de Trimble 3300/3600/5600 Elta (*.dat) estén configuradas antes de importar o exportar archivos Elta M5.

Para importar archivos Elta M5 (*.dat):

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos M5 de Trimble 3300/3600/5600 Elta (*.dat).

4.	Haga clic en Opciones para abrir el diálogo Archivos M5 y configure el archivo.

5.	Haga clic en Aceptar para aceptar las configuraciones y regresar al diálogo Exportar.

6.	Haga clic en Aceptar.

Aparecerá el diálogo Abrir.

7.	Seleccione el archivo a importar y haga clic en Abrir.

NOTAS:

 	 Las coordenadas locales (relativas), (por ejemplo, "neh" o "xyz") en el archivo M5 se convierten a coordenadas absolutas al importar.

  	Tras importar un archivo M5, todas las constantes de prisma aparecerán en Trimble Geomatics Office como "?". Para cambiarlo, en el campo de constante de prisma de la ventana propiedades, introduzca la diferencia entre la constante de prisma introducida en el campo y la constante de prisma real. Por ejemplo, si ha introducido una constante de prisma de "20", y la constante real es de "5", introduzca "–15".

  	Trimble Geomatics Office no soporta incrementos de replanteo ortogonales. Estos se convertirán a incrementos de replanteo polar durante la importación. Trimble recomienda configurar el instrumento para almacenar sólo incrementos de replanteo de coordenadas de cuadrícula.

  	Trimble Geomatics Office no soporta ángulos horizontales que se incrementan a la izquierda. No utilice dicha configuración en el instrumento.

Configuración del instrumento

Al importar la media de observaciones de la cara 2 de un instrumento Trimble 3600/5600 Elta, asegúrese de que el instrumento esté configurado para almacenar solamente Valores únicos. Si Valores únicos y Media están seleccionados, Trimble Geomatics Office calculará valores incorrectos. Asimismo, si sólo se ha seleccionado Media, Trimble Geomatics Office mostrará observaciones medias como observaciones de la cara 1.

Trimble Geomatics Office supone que los instrumentos Trimble 3600/5600 Elta siempre tienen las correcciones atmosféricas habilitadas. No inhabilite dichas correcciones en el instrumento.

Deberá utilizar la opción de almacenamiento R-MC en los instrumentos Trimble 3600/5600 Elta (cuando sea posible) y MEM/3 en el instrumento Trimble 3300 para asegurarse de que tiene coordenadas y datos de observación para los cálculos.

Estacionamiento

Para asegurarse de que Trimble Geomatics Office interpreta los datos correctamente, antes de medir, siempre lleve a cabo una rutina de estacionamiento en el instrumento.

Los registros de referencia que han sido eliminados de la configuración de estación, aún se importarán a Trimble Geomatics Office. Inhabilite dichas observaciones a través de la ventana Propiedades.

Trimble Geomatics Office no soporta referencias múltiples. Cuando se miden varios puntos de referencia en la rutina de estacionamiento, Trimble Geomatics Office utilizará el ultimo punto como la visual hacia la referencia.

Rutinas de Elta no soportadas

Las siguientes rutinas del instrumento Elta sacan datos especiales no soportados por Trimble Geomatics Office. Sin embargo, en la mayoría de los casos Trimble Geomatics Office todavía importará las observaciones de dichas rutinas:

  Plano vertical

  Area

  Distancias de conexión

  Transformaciones

  Roadline Lite

  Turnos (series) múltiples

  Plano 3D

Para exportar el proyecto actual de Trimble Geomatics Office a un archivo Elta M5 (*.dat):

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Resalte la opción Archivos M5 de Trimble 3300/3600/5600 Elta (*.dat).

4.	Haga clic en Opciones para abrir el diálogo Opciones archivo M5  y configure el archivo.

5.	Haga clic en Aceptar para aceptar las configuraciones y regresar al diálogo Exportar.

6.	Haga clic en Aceptar.

Aparecerá el diálogo Guardar como.

7.	Seleccione la carpeta en la que se va a guardar el archivo.

8.	Introduzca un nombre en el campo Nombre de archivo y haga clic en Guardar.


Archivos M5 de Trimble Elta GPS Controller (*.dat)

En Trimble Geomatics Office, podrá:

  Importar archivos M5 de Elta GPS Controller a un proyecto de Trimble Geomatics Office.

  Exportar de un proyecto de Trimble Geomatics Office a un archivo de coordenadas M5 de Elta GPS Controller.

También podrá transferir archivos directamente al y del software Trimble Elta GPS Controller mediante las opciones para exportar e importar de Dispositivos topográficos.

Asegúrese de configurar las Opciones archivo M5 para los archivos M5 de Trimble Elta GPS Controller antes de importar o exportar los archivos M5 de Elta GPS Controller.

Para importar archivos M5 de Elta GPS Controller:

1.	Seleccione Archivo / Importar.

Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos M5 de Trimble Elta GPS Controller (*.dat).

4.	Haga clic en Opciones para abrir el diálogo Opciones archivo M5 y configure el archivo.

5.	Haga clic en Aceptar para aceptar las configuraciones y regresar al diálogo Importar.

6.	Haga clic en Aceptar.

Aparecerá el diálogo Abrir.

7.	Seleccione el archivo a importar y haga clic en Abrir.

NOTA: Trimble Geomatics Office importa todas las coordenadas en el archivo M5 como puntos de cuadrícula solamente. Para asegurarse de que las coordenadas en Trimble Geomatics Office coinciden con las coordenadas en Trimble Elta GPS Controller, deberá realizar una calibración (transformación) en el campo al iniciar el levantamiento.

Para exportar el proyecto actual de Trimble Geomatics Office a un archivo M5 de Elta GPS Controller:

1.	Seleccione Archivo / Exportar.

Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Resalte la opción Archivos M5 de Trimble Elta GPS Controller (*.dat).

4.	Haga clic en Opciones para abrir el diálogo Opciones archivo M5 y configure el archivo.

5.	Haga clic en Aceptar para aceptar las configuraciones y regresar al diálogo Exportar.

6.	Haga clic en Aceptar.

Aparecerá el diálogo Guardar como.

7.	Seleccione la carpeta en la que se va a guardar el archivo.

8.	Introduzca un nombre en el campo Nombre de archivo y haga clic en Guardar.


Diálogo Opciones archivo M5

Use el diálogo Opciones archivo M5 para configurar los siguientes archivos a importar y exportar:

  Archivos M5 de Trimble 3300/3600/5600 Elta

  Archivos M5 de Trimble Elta GPS Controller

Especifique el tipo de instrumento, marcas de archivo, configuraciones de coordenadas y configuraciones de puntos duplicados  (para importar).

Para acceder al diálogo de opciones:

1.	Seleccione Archivo / Exportar (o Importar).

2.	Seleccione la ficha Levantamiento.

3.	Seleccione una de las siguientes opciones:

  Archivos M5 de Trimble 3300/3600/5600 Elta (*.dat)

  Archivos M5 de Trimble Elta GPS Controller (*.dat)

4.	Haga clic en Opciones.

Marcas archivo

Seleccione una de las siguientes alternativas:

  Por defecto. (Trimble recomienda esta opción)

Haga clic en el botón Avanzado para ver las Configuraciones del formato de línea y la Presentación preliminar del formato de la opción Por defecto.

NOTA: Los valores por defecto son diferentes según el tipo de instrumento seleccionado.

  Definido por el usuario

La opción Definido por el usuario le permite cambiar las configuraciones del formato de línea y ver los cambios en la sección Presentación preliminar del formato. Seleccione Definido por el usuario y haga clic en Avanzado. En el diálogo Opciones avanzadas de marcas:

a.	Especifique la posición del carácter inicial para el nombre de punto, el código y la descripción.

b.	Especifique las anchuras de campo del nombre de punto, del código y de la descripción.

c.	Introduzca un Número de marcas.

NOTA: Si las configuraciones del formato de línea definidas por el usuario no son válidas, Trimble Geomatics Office requerirá valores de configuración válidos.

Configuraciones coordenadas

En las listas desplegables Orden de coordenadas y Elevación, seleccione el orden de coordenadas y las etiquetas de coordenadas en el archivo que se van a importar o exportar.

NOTAS:

Los campos disponibles dependen del tipo de instrumento seleccionado.

Durante la exportación, se truncarán los nombres de punto, los códigos y las descripciones que excedan el espacio disponible.

Los puntos con nombres alfanuméricos no se exportarán al instrumento Trimble 3300.


Puntos - Visión de conjunto
Puntos − Visión de conjunto

Los puntos son el objetivo principal de un proyecto de Trimble Geomatics Office. Los mismos se añaden al proyecto cada vez que se importan datos o cada vez que se añaden puntos usando el diálogo Insertar puntos o el diálogo Insertar puntos por acimut y distancia.

Los puntos se ven en la Vista del levantamiento y la Vista del plano. Para ver los detalles de un punto, selecciónelo y abra la ventana Propiedades.

Una punto tiene una posición calculada, que está determinada por un recálculo. Esta posición es la mejor posición para el punto usando coordenadas tecleadas y observaciones para el punto.

En la Vista del levantamiento, los puntos aparecen como puntos y se muestran las observaciones entre los mismos. En la Vista del plano, los puntos se visualizan según el estilo de punto. La base de datos permite puntos con nombres duplicados.


Diálogo Insertar puntos

Use este diálogo para insertar puntos en la base de datos. Los campos cambian dependiendo de la opción que escoja en el Campo Tipo de coordenada.

Para acceder al mismo, realice una de las siguientes acciones:

  En la Vista del levantamiento, seleccione Insertar / Puntos.

  En la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Puntos.

  Haga clic en la herramienta Insertar puntos [image].

Insertar

Haga clic en Insertar para insertar el punto en la base de datos. El diálogo estará disponible para añadir otro (nuevo) punto.

NOTA: Al añadir la primera posición GPS o de cuadrícula a un proyecto con una proyección por defecto no definida (Mercator Transversa), Trimble Geomatics Office presenta un diálogo adecuado para ayudarle a inicializar correctamente la proyección.

Cerrar

Haga clic en Cerrar para dejar de insertar puntos y salir del diálogo.

Nombre

Introduzca un nombre usando el teclado. Se puede introducir un nombre de hasta 16 caracteres de longitud.

Los siguientes caracteres no se pueden usar con nombres:

  llaves {}

  corchetes []

  paréntesis ()

  signo de porcentaje %

  signo igual =

  comillas ″ ″ o ‘ ‘

NOTA: Cuando se insertan puntos en serie, los nombres se incrementarán automáticamente si el nombre de punto introducido anteriormente finaliza con un número.

NOTA: Para configurar el nombre de punto en el Diálogo Propiedades del Proyecto, seleccione las Unidades y la ficha Formato y luego utilice Iniciar nombre de punto auto del campo.

Grupo Info de coords

Para cada componente de coordenada (horizontal, elevación, altura) seleccione la calidad correspondiente. Un recálculo utiliza dichas calidades para determinar la mejor posición para el punto.

El grupo de detalles de coordenadas cambia dependiendo de si selecciona la opción WGS-84, Cuadrícula, o Local en este cuadro de diálogo. Cada grupo de detalles de coordenadas indistintamente representa una vista de coordenadas.

Si ha seleccionado la opción Cuadrícula, aparecerán los siguientes campos:

Norte	Use Rellenar campo o introduzca un valor del teclado. Si utiliza Rellenar campo, los campos Norte y Este se rellenarán con la posición donde ha hecho clic.
Este	Use Rellenar campo o introduzca un valor desde el teclado. Si usa Rellenar campo, los campos Norte y Este son rellenos con la posición en la que hizo clic.

Si ha seleccionado la opción WGS-84 o Local y ha configurado el parámetro Muestra WGS-84 como (en la ficha Unidades y formato del diálogo Propiedades proyecto) en L,L,A, aparecerán los siguientes campos:

Latitud	Use Rellenar campo o introduzca un valor del teclado. Si utiliza Rellenar campo, los campos Latitud y Longitud se rellenarán con la posición donde ha hecho clic.
Longitud	Use Rellenar campo o introduzca un valor del teclado. Si utiliza Rellenar campo, los campos Latitud y Longitud se rellenarán con la posición donde ha hecho clic.

Los siguientes campos aparecerán con cualquier opción:

Elevación	Introduzca un valor del teclado o haga clic en un punto existente. Si hace clic en un punto existente, el valor Elevación para dicho punto se rellenará en el campo Elevación.
Altura	Use Rellenar campo o introduzca un valor del teclado. Si hace clic en un punto existente, el valor Altura para dicho punto se rellenará en el campo Altura.

SUGERENCIA: Para ubicar un punto junto a una línea de observación en la Vista del levantamiento o una línea en la Vista del plano, mantenga presionado Ctrl mientras usa Rellenar campo. Puede utilizar Rellenar campo para obtener una coordenada aproximada y luego editar dicho valor.

NOTA: Si ha configurado el parámetro Muestra WGS-84 como en la ficha Unidades y formato del diálogo Propiedades proyecto en X,Y,Z; entonces aparecerán los campos X,Y,Z. Use Rellenar campo o introduzca un valor del teclado. Si utiliza Rellenar campo, los campos se rellenarán con la posición donde ha hecho clic.

Tipo de coordenada

En este campo, seleccione la opción (WGS-84, Sitio, cuadrícula) que quiera usar para guardar las coordenadas en la base de datos. Seleccionando el tipo de coordenada, se cambia la vista de coordenada a la misma configuración que la de tipo de coordenada.

NOTA: Si desea editar campos en el grupo de Campo Detalles de coordenada, las configuraciones de Tipo de coordenada y configuraciones de vista deben ser las mismas.

Grupo Detalles CAD

Este grupo contiene todos los campos para un punto que se ven en la Vista del plano.

Código característica

Introduzca un valor del teclado o haga clic en un punto existente. Si hace clic en un punto existente, el valor Código característica para dicho punto se rellenará en el campo Código característica.

Descripción

Introduzca un valor del teclado o haga clic en un punto existente. Si hace clic en un punto existente, el valor Descripción para dicho punto se rellenará en el campo Descripción.

Capa

Realice una de las siguientes acciones:

  Seleccione una capa existente de la lista.

  Introduzca una nueva capa usando el teclado. Aparecerá el diálogo Nueva capa.

  Haga clic en un punto existente. Si hace clic en un punto existente, el valor Capa para dicho punto se rellenará en el campo Capa.

Estilo de punto

Realice una de las siguientes acciones:

  Seleccione un punto existente de la lista.

  Introduzca un nuevo estilo de punto usando el teclado. Aparecerá el diálogo Crear estilo de punto.

  Haga clic en un punto existente. Si hace clic en un punto existente, el valor Estilo de punto para dicho punto se rellenará en el campo Estilo de punto.


Comando Puntos por acimut y distancia

Use este comando para insertar puntos por un acimut y una distancia desde un punto conocido.

Para acceder al mismo, seleccione Insertar / Puntos por acimut y distancia.

Aparecerá el diálogo Insertar puntos por acimut y distancia.


Diálogo Insertar puntos por acimut y distancia

Use este diálogo para insertar puntos por un acimut y una distancia desde un punto conocido.

Para acceder al mismo, realice una de las siguientes acciones:

  Seleccione Insertar / Puntos por acimut y distancia.

  En la Vista del plano, haga clic en la herramienta Añadir puntos por acimut y distancia [image].

NOTA: Las calidades para el nuevo punto son las mismas que para Desde punto. Si no se especifica un incremento de elevación, no se conocerán los campos Elevación y Altura para el nuevo punto.

Nombre punto

Introduzca un nombre de punto usando el teclado. Se puede introducir un nombre de hasta 16 caracteres de longitud.

Los siguientes caracteres no se pueden usar en los nombres:

  llaves {}

  corchetes []

  paréntesis ()

  signo de porcentaje %

  signo igual =

  comillas ″ ″ o ‘ ‘

Desde punto

Introduzca un nombre de punto existente usando el teclado o haga clic en un punto existente.

Acimut

Este campo depende de la configuración del Tipo de acimut. Introduzca un valor de acimut en el formato configurado para el Formato ángulo (grados) en la ficha Unidades y formato.

Distancia

Este campo depende de la configuración del campo Mostrar distancia como en la ficha Unidades y formato. Si no especifica una unidad, se usarán las unidades actuales del proyecto; sin embargo puede especificar m, psi (pies internacionales) o ps USA (pies topográficos USA).

Incremento elevación

Este valor se añade a la elevación de Desde punto para derivar una elevación para el punto nuevo. Un cambio positivo significa que el punto nuevo tiene una elevación más grande que Desde punto. Introduzca un número negativo si el punto nuevo tiene una elevación más pequeña que Desde punto. Si no especifica una unidad, se usarán las unidades actuales del proyecto; sin embargo puede especificar m, psi (pies internacionales) o ps USA (pies topográficos USA). Si no se especifica un incremento de elevación, la elevación del punto nuevo será nula.

Tipo de acimut

Use este grupo para seleccionar la cuadrícula o la sección normal acimut adelante.

 Cuadrícula − Seleccione esta opción para mostrar la Cuadrícula Acimut.

 Sección Normal adelante − Seleccione esta opción para mostrar la Sección Normal acimut adelante.

Método

Use este grupo para seleccionar cómo el software preparará el diálogo después de haber insertado un punto.

 Secuencial − 	Cuando se añade un nuevo punto, esta opción inserta el nombre del nuevo punto en el campo Desde punto. Use esta opción para introducir una poligonal.

 Radial − 	Mantiene el nombre Desde punto sin cambiar. Use dicha opción para introducir radiaciones en puntos a partir del mismo punto.

Unir

Use esta casilla de verificación para trazar una línea entre ″desde″ punto y el punto nuevo. La línea se añade a la capa actual y se traza en el estilo de línea por defecto para la capa actual. Sólo es visible en la Vista Plan.


Diálogo Insertar Acimut

Un acimut se usa para orientar observaciones terrestres. Use este diálogo para insertar un acimut entre dos puntos.

Para acceder a él:

  En la vista Levantamiento, seleccione Insertar / Acimut.

Desde punto y A punto

En éstos campos, use el teclado o la opción Rellenar campo para introducir un nombre de punto existente.

Acimut

Si se introducen puntos existentes ″desde″ y ″a″, entonces se muestra un valor de acimut calculado. Si es necesario, se puede editar tanto este valor como la calidad del acimut. El acimut que se muestra en este campo depende de la vista de acimut que especifique abajo.

Si un acimut ya existe para su punto par, se le pregunta si desea sobrescribir en él.

Tipo de acimut

Use este campo para determinar cómo el acimut es guardado en la base de datos; es decir, como una cuadrícula o sección normal acimut adelante.

Cuadrícula/Ant Sección Normal

Seleccione una de estas opciones para determinar como deben mostrarse las coordenadas en el diálogo Insertar Acimut; es decir, la vista de acimut.

NOTA: Si desea editar los campos en este diálogo, entonces el tipo de acimut y la vista de acimut deben ser las mismas.

NOTA: Si el punto "a" no tiene una coordenada, la conversión entre la cuadrícula de acimut y la sección normal acimut adelante no pueden ser calculadas y el  Acimut se muestra como Nulo.

Insertar

Use este botón para insertar el acimut en el proyecto. El acimut se muestra entre los dos puntos de definición y con la flecha indicando la dirección.

Cerrar

Use este botón para cerrar el diálogo.


    Comando Líneas

Use este comando para insertar líneas en la base de datos.

Para acceder al mismo, realice una de las siguientes acciones:

  Seleccione Insertar / Líneas.

Aparecerá el diálogo Insertar línea con la ficha Línea seleccionada.


    Diálogo Insertar línea

Use este diálogo para insertar nuevas líneas (líneas, curvas o arcos) en la base de datos.

Para acceder al mismo, realice una de las siguientes acciones:

Líneas	Seleccione la herramienta Insertar líneas [image].   Seleccione Insertar / Líneas.
Curvas	Seleccione la herramienta Insertar curvas [image].    Seleccione Insertar / Curvas.
Arcos	Seleccione la herramienta Insertar arcos [image].    Seleccione Insertar / Arcos.

Aparecerá el diálogo Insertar línea con la ficha adecuada seleccionada.

Use Rellenar campo o introduzca los detalles con el teclado para completar el diálogo. Para añadir líneas rápidamente, haga doble clic en Rellenar campo mientras está en el campo Al punto.

Se puede cambiar el tipo de trabajo lineal en cualquier momento. En este caso, es posible unir secuencias de líneas, curvas, arcos, o cualquier combinación.

Se pueden añadir tres tipos de trabajo lineal a la base de datos:

  líneas

  arcos

  curvas

Insertar

Haga clic en Insertar para añadir al proyecto y mantener el diálogo abierto para añadir una nueva línea.

El valor del punto "desde" se convierte en el valor del punto "a" listo para el siguiente trabajo lineal.


Líneas - Visión de conjunto
    Líneas − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

En Trimble Geomatics Office se pueden insertar líneas entre puntos. Inserte líneas en el proyecto para definir límites de líneas (por ejemplo, líneas de vallas, edificios y caños).

Las líneas aparecen en la ventana gráfica cuando se ve el proyecto en la Vista del plano. Para ver las propiedades de la línea, seleccione la línea y abra la ventana Propiedades.

Las líneas se muestran de acuerdo con el estilo de línea. Se pueden usar los estilos de línea de Trimble o crear sus propios estilos.

Las líneas se pueden exportar en algunos formatos (por ejemplo, los formatos AutoCAD y TRIMMAP).


Arcos - Visión de conjunto
    Arcos − Visión de conjunto

Más información

Cómo...	Diálogo	Véase también
Visión de conjunto

Se pueden crear arcos para mostrar arcos circulares suavizados entre puntos.

Los arcos aparecen en la ventana gráfica al ver el proyecto en la Vista del plano. Para ver las propiedades del arco, seleccione el arco y abra la ventana Propiedades.

Los arcos se muestran de acuerdo con el estilo de línea. Se pueden usar los estilos de línea de Trimble o crear sus propios estilos.

Los arcos se exportan en algunos formatos (por ejemplo, los formatos AutoCAD y TRIMMAP).


Curvas - Visión de conjunto
    Curvas − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Inserte curvas para crear curvas de mejor acoplamiento entre los puntos. Utilice curvas para definir límites que no son líneas rectas (por ejemplos, cursos de agua o caminos).

Las curvas aparecen en la ventana gráfica cuando el proyecto se ve en la Vista del plano.

Las curvas se muestran según el estilo de línea. Se pueden usar los estilos de línea de Trimble o crear sus propios estilos.

Cada vez que inserta una curva desde un punto que se utiliza en otra curva, Trimble Geomatics Office vuelve a calcular la curva existente para asegurarse de que se muestra una curva suavizada.

Las curvas se exportan en algunos formatos (por ejemplo, los formatos AutoCAD y TRIMMAP).


Diálogo Insertar línea - Ficha Línea
    Diálogo Insertar línea − Ficha Línea

Use este diálogo para insertar líneas en la base de datos.

Para acceder al mismo, desde la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Líneas.

  Seleccione la herramienta Insertar líneas [image].

Aparecerá el diálogo Insertar línea con la ficha Línea seleccionada.

Desde punto

Realice una de las siguientes acciones:

  Use Rellenar campo para seleccionar el primer punto que desea usar para definir la línea.

  Introduzca el nombre de punto para el primer punto que desea usar para definir la línea.

Al punto

Realice una de las siguientes acciones:

  Use Rellenar campo para seleccionar el segundo punto que desea usar para definir la línea.

  Introduzca el nombre de punto para el segundo punto que desea usar para definir la línea.

Capa

Realice una de las siguientes acciones:

  Seleccione la capa a la que desea añadir la línea.

  Introduzca un nombre de capa para crear una nueva capa. Aparecerá el diálogo Nueva capa.

Estilo de línea

Seleccione el estilo de línea que desea usar para mostrar la línea. Los estilos disponibles son los estilos de línea del diálogo Estilos CAD.

Insertar

Haga clic en Insertar para insertar la línea. El punto seleccionado en el campo Al punto se seleccionará por defecto en el campo Desde punto. Se lo podrá cambiar si fuera necesario.

Cerrar

Haga clic en Cerrar para dejar de insertar líneas.


    Comando Arcos

Use este comando para insertar arcos en la base de datos.

Para acceder al mismo, desde la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Arcos.

  Seleccione la herramienta Insertar arco [image].

Aparecerá el diálogo Insertar línea con la ficha Arco seleccionada.


Diálogo Insertar línea - Ficha Arco
    Diálogo Insertar línea − Ficha Arco

Use este diálogo para insertar arcos en la base de datos.

Para acceder al mismo, desde la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Arcos.

  Seleccione la herramienta Insertar arco [image].

Aparecerá el diálogo Insertar línea con la ficha Arco seleccionada.

Desde punto

Realice una de las siguientes acciones:

  Use Rellenar campo y haga clic en el punto correspondiente.

  Use el teclado para introducir el nombre de punto.

Al punto

Realice una de las siguientes acciones:

  Use Rellenar campo y haga clic en el punto correspondiente.

  Use el teclado para introducir el nombre de punto.

Punto central

Para usar un punto existente como el centro del arco, realice una de las siguientes acciones:

  Introduzca un nombre de punto existente.

  Use Rellenar campo para seleccionar un punto existente.

Las coordenadas del punto se copiarán a los campo Norte pto central y Este pto central.

Norte pto central, Este pto central

Para usar coordenadas como el centro del arco, use Rellenar campo para hacer clic en una posición en la ventana gráfica . Las coordenadas se copiarán a dichos campos.

NOTA: Si introduce un punto central y coordenadas centrales, se usará el punto central.

Arco pequeño

Seleccione la opción Verdadero si desea crear un arco pequeño. De lo contrario, seleccione Falso. Siempre hay dos arcos posibles entre dos puntos, que juntos definen un círculo. Dicha configuración define el arco que desea dibujar. Encontrará la explicación en la siguiente figura:

NOTA: El centro del arco es el punto medio de una línea recta que une los 2 puntos, o las coordenadas de los campos Norte pto central o Este pto central.

Capa

Realice una de las siguientes acciones:

  Seleccione la capa a la que desea añadir el arco.

  Introduzca un nombre de capa nuevo para crear una nueva capa. Aparecerá el diálogo Nueva capa.

Estilo de línea

Seleccione el estilo de línea que desea usar para mostrar el arco. Los estilos disponibles son los estilos de arco del diálogo Estilos CAD.

Insertar

Haga clic en Insertar para insertar el arco. El punto seleccionado en el campo Al punto se seleccionará por defecto en el campo Desde punto. Se lo podrá cambiar si fuera necesario.

Cerrar

Haga clic en Cerrar para dejar de insertar arcos.


    Comando Curvas

Use este comando para insertar curvas en la base de datos.

Para acceder al mismo, desde la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Curvas.

  Seleccione la herramienta Insertar curva [image].

Aparecerá el diálogo Insertar línea con la ficha Curva seleccionada.


Diálogo Insertar línea - Ficha Curva
    Diálogo Insertar línea − Ficha Curva

Use este diálogo para insertar curvas en la base de datos.

Para acceder al mismo, desde la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Curvas.

  Seleccione la herramienta Insertar curva [image].

Aparecerá el diálogo Insertar línea con la ficha Curva seleccionada.

Desde punto

Realice una de las siguientes acciones:

  Use Rellenar campo y haga clic en los puntos correspondientes.

  Use el teclado para introducir el (los) nombre(s) de punto.

Al punto

Realice una de las siguientes acciones:

  Use Rellenar campo y haga clic en los puntos correspondientes.

  Use el teclado para introducir el (los) nombre(s) de punto.

Tangente entrada, Tangente salida

Para introducir automáticamente los valores de tangente basados en los puntos usados para definir la curva, deje los valores como <Automático>. Podrá introducir sus propios valores de tangente si fuera necesario.

Suavizamiento

Introduzca un valor entre 0 y 1. El Suavizamiento define la anchura que existe en la curva.

Cuanto más alto el suavizamiento, más grande será la anchura de la curva.

Capa

Realice una de las siguientes acciones:

  Seleccione la capa en la que desea insertar la curva.

  Introduzca un nombre de capa nuevo para crear una nueva capa. Aparecerá el diálogo Nueva capa.

Estilo de línea

Seleccione el estilo de línea que desea usar para mostrar la curva. Los estilos disponibles son los estilos de línea del diálogo Estilos CAD.

Insertar

Haga clic en Insertar para insertar la curva. El punto seleccionado en el campo Al punto se seleccionará por defecto en el campo Desde punto. Se lo podrá cambiar si fuera necesario.

Cerrar

Haga clic en Cerrar para dejar de insertar curvas.


    Comando Texto

Use este comando para abrir el diálogo Insertar texto.

Para acceder al mismo, desde la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Texto.

  Haga clic en la herramienta Insertar texto [image].


    Diálogo Insertar texto

Use este diálogo para insertar texto nuevo en la base de datos.

Para acceder al mismo, realice una de las siguientes acciones:

  Seleccione Insertar / Texto.

  Haga clic en la herramienta Insertar texto [image].

Expresión texto

Introduzca el texto que desea que se muestre. Para usar códigos de campo (por ejemplo, el título del proyecto) haga clic con el botón derecho del ratón en el menú abreviado y seleccione Campos.

Norte

Para introducir el valor Norte para la posición del texto, realice una de las siguientes acciones:

  Use Rellenar campo haciendo clic en una ubicación en la ventana gráfica.

  Introduzca el valor Norte usando el teclado.

Este

Para introduce el valor Este para la posición del texto, realice una de las siguientes acciones:

  Use Rellenar campo haciendo clic en una ubicación en la ventana gráfica.

  Introduzca el valor Este usando el teclado.

Orientación

Introduzca una orientación para la entidad de texto. Si no especifica una orientación, el texto se mostrará horizontalmente a través de la ventana.

Tipo ancla

Especifique dónde está ubicado el texto con respecto a los valores Norte y Este. Seleccione un valor de la lista.

Capa

Seleccione la capa a la que desea añadir texto de la lista. Para introducir texto en una nueva capa, teclee un nombre nuevo. Aparecerá el diálogo Nueva capa.

Estilo texto

Seleccione el estilo de texto de la lista para la entidad de texto. Si desea usar el estilo de texto por defecto configurado para la capa a la que está añadiendo texto, seleccione la opción <Por capa>.

Para editar y crear estilos de texto, seleccione Editar / Estilos.

Insertar

Haga clic en Insertar para añadir el texto al proyecto y mantener el diálogo abierto para añadir más texto.


Texto - Visión de conjunto
Texto − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Se puede añadir texto a un proyecto. Por ejemplo, añada texto para describir figuras o para mostrar cabeceras del proyecto.

El texto aparece en la ventana gráfica. Para ver las propiedades del texto, selecciónelo y abra la ventana Propiedades. También puede arrastrar texto a una nueva ubicación en la ventana gráfica o rotar el texto.

El texto se exporta en algunos formatos (por ejemplo, los formatos AutoCAD y TRIMMAP).


Anotaciones - Visión de conjunto
    Anotaciones − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Las anotaciones son tipos de texto asociados con entidades (puntos, líneas y arcos). El texto que aparece está definido por una plantilla de anotación.

Las plantillas de anotación definen:

  lo que se anota

  la posición de la anotación con respecto a la entidad

Las plantillas de anotación pueden contener combinaciones de texto definidas por el usuario y códigos de campo. Los códigos de campo se expanden cada vez que cambia el campo que se está anotando. Por ejemplo, si un punto se anota con la elevación y cambia la elevación del punto, la anotación se actualizará.

Las anotaciones se almacenan en un proyecto.

Plantillas de anotación

Trimble provee algunas plantillas de anotación predefinidas. Si procesa códigos de característica y la biblioteca de características y atributos contiene plantillas de anotación, las mismas se añaden a esta lista de plantillas. Puesto que las plantillas de anotación de la biblioteca de características y atributos no tienen un configuración del estilo de texto, el estilo de texto estándar se usará por defecto cuando las plantillas de anotación se añadan al proyecto de Trimble Geomatics Office.

Añadir anotaciones

Para añadir anotaciones, de la Vista del plano, realice una de las siguientes acciones:

  Seleccione Insertar / Anotaciones.

  Seleccione Editar / Plantillas de anotación. Haga clic en Nuevo.

  Use el procesamiento de códigos de características para anotar entidades. Consulte más información en la ayuda de la utilidad Editor de características y atributos de Trimble.

NOTA: Para editar anotaciones existentes, use la ventana Propiedades.


    Comando Anotaciones

Utilice este comando para anotar los puntos, líneas, o arcos seleccionados.

Para acceder al mismo, seleccione Insertar / Anotaciones.

Aparecerá el diálogo Anotar.


    Diálogo Anotar

 Visión de conjunto y más información

Use este diálogo para anotar los puntos, líneas o arcos seleccionados.

Para acceder al mismo, seleccione Insertar / Anotaciones.

El punto de inserción para las anotaciones de entidades con tamaño de papel se determina con respecto a la dimensión de la entidad y la escala de dibujo configurada en el diálogo Archivo / Configuración hoja. Se añade una distancia de un tercio de la altura del carácter entre la anotación y la entidad anotada.

Plantilla de anotación

Seleccione una plantilla de la lista.

Retener anotaciones existentes

Seleccione esta casilla de verificación para retener las anotaciones existentes que se han asignado a las entidades que se van a anotar. Las nuevas anotaciones se añaden además de las existentes, aun cuando están en la misma ubicación.

SUGERENCIA: Se puede usar esta facilidad para proporcionar anotaciones múltiples para entidades separadas en distintas capas en el diálogo Plantilla de anotación.

Si no verifica esta casilla de verificación, las anotaciones asignadas a las entidades que están por anotarse se eliminarán de la base de datos antes de añadir la nueva anotación.

Anotar

Hay dos formas de anotar entidades:

Selección	Seleccione esta opción para anotar las entidades seleccionadas.
Toda base datos	Seleccione esta opción para anotar todas las entidades.
Estos botones no están disponibles cuando no se selecciona nada. En este caso, se anotan todas las entidades.

Quitar

Para quitar todas las anotaciones de las entidades seleccionadas, realice una de las siguientes acciones:

  Haga clic en Quitar.

  Seleccione las anotaciones y elija Editar / Eliminar.

Plantillas

Haga clic en Plantillas para mostrar el diálogo Plantillas de anotación. Utilice este diálogo para seleccionar las plantillas de anotación que quiera crear, modificar, o eliminar. Consulte más información en el diálogo Plantillas de anotación.


    Diálogo Plantillas de anotación

 Visión de conjunto y más información

Use este diálogo para administrar plantillas de anotación.

Para acceder al mismo:

1.	Seleccione Insertar / Anotaciones.

2.	Haga clic en Plantillas.

Una plantilla de anotación define el estilo, la posición y el contenido de una o más anotaciones. Una vez asignadas, cada anotación es una pieza discreta de información textual independientemente de la plantilla de anotación. Las anotaciones se almacenan en el proyecto.

Trimble Geomatics Office usa códigos de campo para especificar los valores que muestra la anotación. Una anotación está viva: cada vez que se cambie la entidad original volverán a expandirse todos los códigos de campo.

Plantillas de anotación

Esta lista contiene todas las plantillas de anotación que se encuentran actualmente en el proyecto.

Para modificar o eliminar una plantilla de anotación existente, resalte el nombre de plantilla correspondiente.

Nuevo

Haga clic en Nuevo para crear una nueva plantilla de anotación. Aparecerá el diálogo Plantilla de anotación.

Editar

Haga clic en Editar para modificar una plantilla de anotación existente. Aparecerá el diálogo Plantilla de anotación.

Eliminar

Haga clic en Eliminar para eliminar la Plantilla de anotación seleccionada. Esto la eliminará del proyecto.


    Diálogo Plantilla de anotación

 Visión de conjunto y más información

Use las fichas en este diálogo para configurar la plantilla de anotación que se está creando o modificando.

Para acceder al mismo:

1.	Realice una de las siguientes acciones:

  Seleccionar Insertar / Anotaciones. Haga clic en Plantillas.

  Seleccione Editar / Plantillas de anotación.

Aparecerá el diálogo Plantillas de anotación.

2.	Haga clic en Nuevo o Editar.

Use las cuatro fichas para definir la plantilla de anotación:

  Configuraciones

  Puntos

  Líneas

  Arcos


Diálogo Plantilla de anotación - Ficha Configuraciones
    Diálogo Plantilla de anotación − Ficha Configuraciones

 Visión de conjunto y más información

Use la ficha Configuraciones para editar las configuraciones generales para la plantilla de anotación.

Para acceder a la misma:

1.	Seleccione Insertar / Anotaciones.

2.	Haga clic en Plantillas.

3.	Haga clic en Nuevo o Editar.

4.	Seleccione la ficha Configuraciones.

Nombre

Introduzca un nombre para ver o renombrar el nombre actual de la plantilla.

Estilo de texto

Defina el estilo de texto para la anotación.

Para definir estilos de texto para la anotación, seleccione Editar / Estilos en la Vista del plano. Si selecciona la opción <Por capa>, la configuración del estilo de texto, para la capa a la que se está añadiendo la anotación, heredará el estilo de texto.

Para configurar valores por defecto para la capa, seleccione Editar / Capas en la Vista del plano.

Orientación de la anotación del punto

Introduzca la orientación de la anotación del punto que requiera. Puede utilizar cualquier orientación desde 00°00'00" a 360°00'00". El valor por defecto es de 90°00'00".

Capa

Colocar	Use esta opción para colocar anotaciones en una capa especificada. Puede seleccionarlas de la lista de capas existentes o introducir un nombre de capa nuevo. Si se introduce éste último, cuando se aplique la plantilla la capa se creará automáticamente.

Colocar en la capa actual

Use esta opción para colocar anotaciones en la capa actual. Esta última se mostrará en la herramienta Selección de capas en la Vista del plano y el diálogo Capas.

Colocar en la capa de la entidad anotada

Use esta opción para colocar anotaciones en la capa de la entidad anotada.


Diálogo Plantilla de anotación - Ficha Puntos
    Diálogo Plantilla de anotación − Ficha Puntos

 Visión de conjunto y más información

Use la ficha Puntos para definir anotaciones para puntos cuando estos últimos se anotan utilizando dicha plantilla.

Para acceder a la misma:

1.	Seleccione Insertar / Anotaciones.

2.	Haga clic en Plantillas.

3.	Haga clic en Nuevo o Editar.

4.	Seleccione la ficha Puntos.

El texto de anotación en cada una de las cuatro posiciones (Izqda, Sí (En), Drcha, Flotante) puede tener un máximo de 100 caracteres alfanuméricos. Los valores en cada posición pueden consistir en texto definido por el usuario y códigos de campo. Los códigos de campo se utilizan para extraer los detalles de anotación de la base de datos. Por ejemplo, el código de campo ‘[nombre]’ se utiliza para anotar un punto con el nombre; en este caso a la derecha del punto.

Un punto se puede anotar con una combinación de cuatro posiciones por defecto. Para mover una anotación de una posición por defecto, use el ratón para arrastrar la anotación a una posición más adecuada. La anotación todavía estará vinculada al punto.

Ubicación	La anotación aparece:

Izqda	a la izquierda del punto.

Sí (En)	sobre el punto.

Drcha	a la derecha del punto.

Flotante	en una posición alejada del punto pero vinculada al mismo.


Diálogo Plantilla de anotación - Ficha Líneas
    Diálogo Plantilla de anotación − Ficha Líneas

Use la ficha Líneas para definir anotaciones para líneas cuando estas últimas se anotan usando dicha plantilla.

Para acceder a la misma:

1.	Seleccione Insertar / Anotaciones.

2.	Haga clic en Plantillas.

3.	Haga clic en Nuevo o Editar.

4.	Seleccione la ficha Líneas.

El texto de anotación en cada una de las siete posiciones (consulte más adelante), puede tener un máximo de 100 caracteres alfanuméricos. Los valores en cada ubicación pueden consistir en texto definido por el usuario y en códigos de campo. Los códigos de campo se usan para extraer detalles de anotación de la base de datos. Por ejemplo, el código de campo ‘[acimut]’ se emplea para anotar una línea con el valor de acimut (en este caso sobre el centro de la línea) y el código de campo ‘[distancia]’ para anotar una línea con el valor de distancia (en este caso debajo del centro de la línea).

Una línea se puede anotar con una combinación de siete posiciones por defecto. Para mover una anotación de una posición por defecto, use el ratón para arrastrar la anotación a una posición más adecuada. La anotación todavía estará vinculada a la línea.

Ubicación	La anotación se aparece:

Arriba izquierda	sobre y en el extremo izquierdo de la línea.

Arriba centro	sobre y en el centro de la línea.

Arriba derecha	sobre y en el extremo derecho de la línea.

Abajo izquierda	debajo y en el extremo izquierdo de la línea.

Abajo centro	debajo y en el centro de la línea.

Abajo derecha	debajo y en el extremo derecho de la línea.

Flotante	en una posición alejada de la línea pero vinculada a la misma.


Diálogo Plantilla de anotación - Ficha Arcos
    Diálogo Plantilla de anotación − Ficha Arcos

Use la ficha Arcos para definir anotaciones para arcos cuando estos últimos se anotan usando dicha plantilla.

Para acceder a la misma:

1.	Seleccione Insertar / Anotaciones.

2.	Haga clic en Plantillas.

3.	Haga clic en Nuevo o Editar.

4.	Seleccione la ficha Arcos.

El texto de anotación en cada una de las siete posiciones (consulte más adelante) puede tener un máximo de 100 caracteres alfanuméricos. Los valores en cada ubicación pueden consistir en texto definido por el usuario y en códigos de campo. Los códigos de campo se usan para extraer detalles de anotación de la base de datos. Por ejemplo, el código de campo ‘[longitud]’ para anotar un arco con el valor de longitud (en este caso sobre el centro del arco) y el código de campo ‘[Radio]’ para anotar un arco con el valor de radio (en este caso debajo del centro del arco).

Un arco se puede anotar con una combinación de siete posiciones por defecto. Para mover una anotación de una posición por defecto, use el ratón para arrastrar la anotación a una posición más adecuada. La anotación todavía estará vinculada al arco.

Ubicación	La anotación aparece:

Arriba izquierda	sobre y en el extremo izquierdo del arco.

Arriba centro	sobre y en el centro del arco.

Arriba derecha	sobre y en el extremo derecho del arco.

Abajo izquierda	debajo y en el extremo izquierdo del arco.

Abajo centro	debajo y en el centro del arco.

Abajo derecha	debajo y en el extremo derecho del arco.

Flotante	en una posición alejada del arco pero vinculada al mismo.


Comando Puntos

Use este comando para insertar puntos nuevos en la base de datos.

Para acceder a este comando, seleccione Insertar / Punto.

Aparecerá el diálogo Insertar punto.


Añadir entidades al proyecto

Se pueden añadir entidades al proyecto desde Trimble Geomatics Office. Una entidad se define como un punto, una línea, un arco, una curva, una anotación o texto. Se pueden añadir todos estos tipos de entidades usando el menú Insertar en la Vista del plano. También puede añadir puntos en la Vista del levantamiento usando el menú Insertar.

Para obtener información sobre cada tipo de entidad, use los siguientes vínculos:

  puntos

  líneas

  arcos

  anotaciones

  texto


 Comando Línea para observaciones actuales

Use este comando para crear líneas CAD para tipos de observación seleccionados. Para acceder al mismo, desde la Vista del plano, seleccione Insertar / Líneas de observación.

Aparecerá el diálogo Insertar línea para observaciones.


 Diálogo Insertar línea para observaciones actuales

Use este diálogo para crear líneas CAD para todas las observaciones en el proyecto.

Para acceder al mismo, desde la Vista del plano, seleccione Insertar / Línea para observaciones actuales.

Tipos de observación

Muestra el tipo de observación. Los tipos posibles son:

Vectores RTK
Vectores con posprocesamiento	Estático, Estático rápido y Cinemático con posprocesamiento
Observaciones terrestres	Convencionales, Láser y Reducidas
Capa CAD

Seleccione la capa para añadir líneas al tipo de observación. La líneas se dibujan usando el estilo de línea por defecto para la capa seleccionada. Si se introduce una nueva capa usando el teclado, aparecerá el diálogo Nueva capa.


Propiedades proyecto
Propiedades proyecto − Visión de conjunto

Más información

Cómo...	Diálogo
Visión de conjunto

Las propiedades de un proyecto contienen todas las configuraciones del proyecto (por ejemplo, el sistema de coordenadas y las unidades de visualización). Las podrá cambiar en cualquier momento. Cuando cambia una propiedad del proyecto, la base de datos del mismo se actualizará para reflejar el cambio. Algunas propiedades del proyecto pueden cambiar los datos del mismo (por ejemplo, cambiar el sistema de coordenadas). Por lo tanto, tenga cuidado al cambiar una propiedad del proyecto que cambia los datos existentes.

No se pueden deshacer los cambios a las propiedades de un proyecto.


Diálogo Propiedades proyecto

Use este diálogo para configurar todas las configuraciones del proyecto.

 Para acceder a él:

 Seleccione Archivo / Propiedades proyecto.

El cuadro de diálogo Propiedades Proyecto tiene las siguientes fichas:

  Ficha Sistema de coordenadas

  Ficha de Informe General

  ficha Detalles proyecto

  ficha Recalcular

  ficha Unidades y formato

  ficha Características


Diálogo Propiedades proyecto - Ficha Detalles proyecto
Diálogo Propiedades proyecto − Ficha Detalles proyecto

Use esta ficha para introducir datos acerca del proyecto/plantilla que desea incluir en informes y dibujos.

Para acceder al mismo:

1.	Seleccione Archivo / Propiedades proyecto. El cuadro de diálogo de Propiedades Proyecto aparece.

2.	Haga clic en la ficha Detalles proyecto.

NOTA: En la lista de Detalles Proyecto, haga clic en el botón derecho del ratón para acceder a un menú de acceso directo que le permite cambiar el nombre de elementos existentes, borrarlos, o insertar nuevos elementos.

Todos los campos en esta ficha son opcionales.

Título

Introduzca un título para el proyecto/plantilla actual en este campo.

Descripción

Introduzca una descripción del proyecto/plantilla si fuera necesario.

Referencia

Introduzca un número de referencia del proyecto para que le permita vincular el proyecto al proceso de costos de la oficina.

Topógrafo

Si fuera necesario, introduzca el nombre del topógrafo que ha completado el trabajo de campo para el proyecto.

Operador computadora

Si fuera necesario, introduzca el nombre del operador de la computadora.

Fecha

Las configuraciones por defecto permiten que este campo registre la fecha de creación del proyecto. Esto se efectúa automáticamente utilizando el código de campo fecha de este campo en un proyecto de plantilla.

Datum Vertical

Introduzca el nombre del datum vertical.

Equipo

Introduzca el (los) número(s) de serie del equipo.

NOTA: Al abrir una plantilla, las definiciones de código de campo no se expandirán. Esta facilidad podrá utilizarse para introducir en sus plantillas definiciones de códigos de campo adecuadas. Cuando se abra un proyecto por primera vez, las definiciones de código de campo se expandirán.


Diálogo Propiedades proyecto - Ficha Sistema de coordenadas
Diálogo Propiedades proyecto − Ficha Sistema de coordenadas

 Visión de conjunto y más información

Use esta ficha para seleccionar y ver el sistema de coordenadas para el proyecto.

Para acceder al mismo:

1.	Seleccione Archivo / Propiedades proyecto. El cuadro de diálogo de Propiedades Proyecto aparece.

2.	Haga clic en el ficha Sistema de coordenadas.

Configuraciones del Sistema de Coordenadas

 Este grupo muestra un resumen del sistema de coordenadas actual. Muestra la ubicación del proyecto, sistema, zona, datum, y modelo geoidal.

El botón Cambiar abre el Cuadro de diálogo Seleccionar Sistema de Coordenadas. Este cuadro de diálogo es la primera página de un asistente que sirve para seleccionar un sistema de coordenadas.

NOTA: Para crear y editar sistemas de coordenadas, use el programa de utilidad Administrador de Sistemas de Coordenadas de Trimble.

Configuraciones de Ajuste Local

Este grupo muestra un resumen de la ubicación del proyecto. Muestra la latitud del proyecto, su longitud y altura, y la forma de mostrar las coordenadas.

El botón Cambiar abre el  cuadro de diálogo de Configuraciones de Ajuste Local. En este cuadro de diálogo usted puede cambiar la ubicación del proyecto y especificar si quiere usar coordenadas terrestres.

Detalles

El botón Detalles  abre el cuadro de diálogo Detalles del sistema de coordenadas.

Use este diálogo para ver los parámetros completos para la proyección del sistema de coordenadas actual, la transformación de datum, el ajuste horizontal, el ajuste vertical, el modelo geoidal, y el ajuste local.

Si realiza una calibración local GPS en el proyecto, los detalles del sistema de coordenadas son una combinación de los parámetros del sistema de coordenadas fundamental y la calibración local GPS (ajuste horizontal y ajuste vertical).

Guardar como local

El botón Guardar como Local abre el cuadro de diálogo Guardar como Local. Use este cuadro de diálogo para guardar los detalles del sistema de coordenadas (incluyendo cualquier  calibración local GPS actual) en la base de datos del sistema de coordenadas como una definición Local.

Una vez que haya especificado el nombre de la definición local,  podrá usar esta definición como la definición del sistema de coordenadas para futuros proyectos. Para editar el ajuste local, use la utilidad Administrador de Sistemas de Coordenadas de Trimble.

NOTA: Los parámetros de ajuste de red no se guardan en un local.


Diálogo Detalles del sistema de coordenadas - Ficha Proyección
Diálogo Detalles del sistema de coordenadas − Ficha Proyección

Para acceder a esta ficha:

1.	Seleccione Archivo / Proyecto. Aparecerá el cuadro de diálogo de Propiedades Proyecto.

2.	En la ficha Sistema de coordenadas haga clic en Detalles. Aparecerá el cuadro de diálogo Detalles del sistema de coordenadas.

3.	Seleccione la ficha Proyección.

Utilice esta ficha para ver los parámetros de proyección. La misma muestra el tipo de proyección (por ejemplo, Mercator transversa o Lambert). Los campos que se muestran dependen de la proyección.

El campo Acimut Sur está referido a la referencia de acimut. La mayoría de los países usan el Norte como la referencia de acimut (Norte = 0°). Sin embargo, algunos lugares tales como Sudáfrica y Hawaii, usan la referencia de acimut Sur (Sur = 0°). Esta casilla se selecciona si está trabajando en una región que utiliza este método cuando se configuran los parámetros de proyección en el Asistente de sistemas de coordenadas o si se define el sistema de coordenadas acimut Sur en la utilidad Administrador de sistemas de coordenadas ™ de Trimble.

Las opciones Norte o Sur y Este u Oeste positivo están referidas a la dirección en la que se incrementan las coordenadas.


Diálogo Detalles del sistema de coordenadas - Ficha Transformación de datum
Diálogo Detalles del sistema de coordenadas − Ficha Transformación de datum

 Véase también

Para acceder a esta ficha:

1.	Seleccione Archivo / Proyecto. Aparecerá el diálogo de Propiedades Proyecto.

2.	En la ficha Sistema de coordenadas haga clic en Detalles. Aparecerá el diálogo Detalles del sistema de coordenadas..

3.	Seleccione la ficha Transformación de datum.

Utilice esta ficha para ver los parámetros de transformación de datum. La misma muestra el método de transformación y los parámetros utilizados para transformar del elipsoide WGS-84 al elipsoide local. Los parámetros del elipsoide local se muestran en el grupo Elipsoide local.

Las opciones de transformación de datum disponibles son:

  Molodensky (Tres parámetros)

  Siete parámetros

  Regresión múltiple

  Cuadrícula del datum

La siguiente tabla muestra los campos que están disponibles para cada opción:


Diálogo Detalles del sistema de coordenadas - Ficha Ajuste
Diálogo Detalles del sistema de coordenadas − Ficha Ajuste

Para acceder a esta ficha:

1.	Seleccione Archivo / Proyecto. Aparecerá el diálogo de Propiedades Proyecto.

2.	En la ficha Sistema de coordenadas haga clic en Detalles. Aparecerá el diálogo Detalles del sistema de coordenadas.

3.	Seleccione la ficha Ajuste.

Use esta ficha para ver los parámetros de ajuste horizontal y vertical. La misma muestra los parámetros para un ajuste horizontal y vertical aplicados a datos topográficos de:

  una calibración local GPS calculada

  una calibración importada de un archivo Survey Controller (*.dc)

  una definición del local

  un ajuste de la red (si tiene instalado el módulo Ajuste de la red)

NOTA: Los campos Pendiente Norte y Pendiente Este en el grupo Ajuste vertical de la calibración se mostrarán en partes por millón (ppm).


Diálogo Detalles del sistema de coordenadas - Ficha Modelo geoidal
Diálogo Detalles del sistema de coordenadas − Ficha Modelo geoidal

Para acceder a esta ficha:

1.	Seleccione Archivo / Proyecto. Aparecerá el diálogo de Propiedades Proyecto.

2.	En la ficha Sistema de coordenadas haga clic en Detalles. Aparecerá el diálogo Detalles del sistema de coordenadas.

3.	Seleccione la ficha Modelo geoidal.

Use esta ficha para ver los detalles del modelo geoidal. La misma muestra el nombre y el archivo de definición para un modelo geoidal que se utiliza para determinar elevaciones para posiciones GPS.

NOTA: Para ver la calidad del modelo geoidal, use Propiedades proyecto / ficha Recalcular.


Cuadro de diálogo de Detalles del Sistema de Coordenadas - Ficha de Ajuste Local
Cuadro de diálogo de Detalles del Sistema de Coordenadas − Ficha de Ajuste Local

Use esta ficha para ver los detalles de ajuste local.

Para acceder a ésta:

1.	Selecccione Archivo / Propiedades Proyecto. El cuadro de diálogo de Propiedades Proyecto aparece.

2.	En la ficha de Sistema de Coordenadas haga clic en Detalles. El cuadro de diálogo de Detalles del Sistema de Coordenadas aparece.

3.	Seleccione la ficha de Ajuste Local.

La ficha muestra:

  la latitud, longitud, y altura de la ubicación del proyecto.

  el factor de escala terrestre, D. eje falso norte, D. eje falso este, y si se están usando coordenadas terrestres.


Cuadro de diálogo de Configuración de Ajuste Local

Use el cuadro de diálogo de Configuración de Ajuste Local para editar la ubicación del proyecto, y especificar si se usarán coordenadas terrestres en el proyecto. Para acceder a él:

1.	Seleccione Archivo / Propiedades Proyecto. El cuadro de diálogo de Propiedades Proyecto aparece.

2.	Seleccione la ficha de Sistema de Coordenadas.

3.	Del grupo de Configuraciones de Ajuste Local, haga clic en Cambiar.

Ubicación del proyecto

Use este grupo para definir la ubicación del proyecto usando un punto en el centro del proyecto. La ubicación del proyecto puede ser definida en coordenadas de cuadrícula, coordenadas locales, o de WGS-84.

NOTA: Usted puede introducir las coordenadas de cuadrícula seleccionando la ubicación en la ventana de gráficos.

Necesita definir la ubicación del proyecto al comienzo del proyecto por que el software usa esta información en sus cálculos. El software usa:

  la latitud del proyecto para calcular el radio terrestre

  la latitud y longitud del proyecto para definir el factor de escala para la cuadrícula.

  la altura del proyecto como la elevación por defecto y para calcular el factor de elevación.

Si el sistema de coordenadas no está definido entonces aparece el cuadro de diálogo de Definición de la Proyección por Defecto. Introduzca una latitud y longitud de origen antes de seleccionar la opción de Uso de coordenadas terrestres.

Usar coordenadas terrestres

Seleccione esta casilla si desea usar coordenadas terrestres en el proyecto. Sin embargo, antes de hacer esto debe definir el sistema de coordenadas y la ubicación del proyecto.

Cuando esta casilla se selecciona, todos los elementos en el grupo Uso de Coordenadas Terrestres quedan disponibles. La casilla Cálculo del Factor de Escala con la ubicación del proyecto queda en blanco la primera vez que usa el cuadro de diálogo de configuración de ajuste Local.

NOTA: El software solamente puede calcular el factor de escala terrestre si los campos de Norte, Este, y elevación son introducidos en el grupo de ubicación del Proyecto.

NOTA: Si lleva a cabo una calibración local GPS y luego selecciona la casilla de Uso de coordenadas terrestres, la calibración definida en el proyecto queda invalidada. Un mensaje le advierte que al continuar con la operación se quitará la calibración.

Presentación de coordenadas terrestres

La opción de Presentación de Coordenadas Terrestres le permite cambiar la forma en que se muestran las coordenadas Terrestres en un proyecto de Trimble Geomatics Office. Este cambio le ayudará a distinguir entre coordenadas de proyección y coordenadas terrestres. Seleccione una de las siguientes opciones:

  Distancia al eje Norte / Distancia al eje Este − agrega una D. eje a las coordenadas que se muestran.

  Coordenadas de 4 dígitos − Muestra 4 dígitos en la presentación de coordenadas terrestres. Por ejemplo, si la coordenada del proyecto es 264150.000, la coordenada terrestre se muestra como 4 510.000.

  Coordenadas de 5 dígitos − Muestra 5 dígitos en la presentación de coordenadas terrestres. Por ejemplo, si la coordenadas del proyecto es 264150.000, la coordenada terrestre se muestra como 64 510.000.


Diálogo Guardar como local

Use este diálogo para guardar el sistema de coordenadas actual como un ajuste local.

Para acceder al mismo:

1.	Seleccione Archivo / Propiedades proyecto. El  diálogo Propiedades Proyecto aparece.

2.	Haga clic en Guardar como local.

Nombre del local

Introduzca el nombre para la definición de ajuste local guardada.

Aceptar

Haga clic en Aceptar para guardar el ajuste local. Este se guarda en la base de datos del sistema de coordenadas. Todos los ajustes locales que se guarden aparecerán en la ficha Locales en la utilidad Administrador de sistemas de coordenadas™ de Trimble. Se puede utilizar la definición local como la definición del sistema de coordenadas para futuros proyectos.

CONSEJO: Al usar la utilidad Administrador de Sistemas de Coordenadas, haga clic en la ficha Locales. El ajuste local aparecerá en azul.


Diálogo Propiedades proyecto - Ficha Unidades y formato
Diálogo Propiedades proyecto − Ficha Unidades y formato

Use esta ficha para configurar los valores de unidades utilizados en Trimble Geomatics Office (tal como la presentación en pantalla, la importación, exportación e informes).

Para acceder a la misma:

1.	Seleccione Archivo / Propiedades proyecto. Se abrirá el diálogo Propiedades Proyecto.

2.	Seleccione la ficha Unidades y formato.

Coordenada

Configure las unidades de visualización para los valores de coordenada (Norte y Este). Las opciones son Pies internacionales, Links, Metros, Pies topo USA o Metros de Namibia.

Elevación/Altura

Configure la unidad de visualización para las elevaciones. Las opciones son Pies internacionales, Links, Metros, Pies topo USA o Metros de Namibia.

Cifras decimales coordenadas

Configure el número de cifras decimales que se mostrarán para las coordenadas. Se pueden especificar hasta cinco cifras decimales.

Orden coordenadas

Configure el orden de las coordenadas. Las opciones son Norte primero o Este primero.

Muestra posición del cursor como

Configure la visualización de la posición del cursor en la barra de estado. Las opciones son Cuadrícula, Lat long local y Lat long WGS.

Distancia

Configure la visualización de distancias. Las opciones son Chains, Pies internacionales, Millas internacionales, Kilómetros, Links, Metros, Pies topo USA o Metros de Namibia.

Cifras decimales distancia

Configure el número de cifras decimales que se mostrarán para las distancias. Se pueden especificar hasta cinco cifras decimales.

Mostrar distancia como

Configure el tipo de distancias que se mostrarán. Las opciones son:

  Distancias elipsoidales (Distancias del nivel del mar)

Esta es la distancia entre dos puntos de la base de datos calculados en la superficie del elipsoide de referencia (a una altura de cero).

  Cuadrícula

Esta es la distancia pitagórica entre las coordenadas de proyección de los dos puntos finales. Es decir, no se aplica un ajuste de proyección, lo que significa que el factor de escala de la proyección para la línea no se aplica a la misma.

  Terreno

Esta es la distancia paralela al Elipsoide que se calcula a la altura media sobre el Elipsoide. Es decir, la distancia elipsoidal calculada matemáticamente ajustada para la altura media de los puntos finales. Si se usan coordenadas terrestres, la distancia de cuadrícula debe ser igual a la distancia terrestre. Ello se describe como:

Donde

H	representa la altura de la base de datos

R	representa el radio de la Tierra

DE	representa la distancia elipsoidal

Area

Configure las unidades de visualización para áreas. Las opciones son Acres, Hectáreas, Pies cuadrados y Metros cuadrados.

Cifras decimales área

Configure el número de cifras decimales que se mostrarán para las áreas. Se pueden especificar hasta cinco cifras decimales.

Unidades ángulo

Configure las unidades angulares utilizadas para todas las direcciones horizontales y acimutes. Las opciones son Grados, Centes y Mils.

Formato ángulo (grados)

Configure el formato de ángulos o acimutes cuando son grados. Las opciones son:

  GGG.gggg	Grados decimales

  GGGMM'SS	Grados, minutos y segundos

  GGGMM'SS.s	Grados, minutos y segundos decimales

  GGGMM.mm	Grados y minutos decimales

Formato ángulo (centes / mils)

Configure el formato de ángulo o acimutes cuando son centes o mils. Las opciones son tres, cuatro o cinco cifras decimales.

Formato acimut

Configure el formato de valores de acimut. Las opciones son:

  Rumbo cuadrante (que se presenta en la forma N6207'40"O)

  Círculo completo (que se presenta en la forma 29752'20")

Muestra WGS-84 como

Configure la opción Muestra WGS-84 como en L,L,A o X,Y,Z. La configuración determina aquí cómo se mostrarán las coordenadas WGS-84 para los puntos en la ventana Propiedades, cuando se inserta un punto o se editan las coordenadas para un punto usando el Coordinate  (Editor de coordenadas). Esta configuración también se usa si crea un formato personalizado para exportar, de informe o para importar con los valores WGS-84.

Formato lat, long

Configure el formato de los valores Latitud y Longitud. Las opciones son:

  GGG.ggggggggg	Grados decimales

  GGGMM'SS.sssss	Segundos decimales

  GGGMM.mmmmmmm	Minutos decimales

Formato escala

Configure la visualización e interpretación de los valores de escala. Las opciones son:

  1 pgs a X ps	Unidades de medidas imperiales

  1:X	Unidades de medidas métricas

Mostrar separador miles

Configure la visualización del separador de miles.

Las opciones son Sí o No. Si selecciona Sí, se aplicará el separador de miles a los valores numéricos, tal y como se ha configurado en el sistema Microsoft Windows. Consulte más información en Configuración regional en el Panel de control de Microsoft Windows.

NOTA: Cuando dicha configuración de visualización está configurada en Sí, se espera que el separador de miles esté presente en archivos ASCII importados y se lo utiliza en archivos ASCII exportados y en informes. Ello puede hacer que no se logre la importación de archivos y producirá que los archivos exportados no tengan el formato esperado. (Considere, por ejemplo, un archivo delimitado por comas con valores numéricos que utiliza un separador de miles coma). El modificador del código de campo “estándar” se puede utilizar en definiciones de formato para forzar al manejo de valores numéricos a que suprima los separadores de miles y se espere siempre que el punto decimal sea un punto.

Mostrar unidades

Determina si las unidades de las coordenadas son mostradas en la ventana de Propiedades y en la barra de estado. La configuración por defecto es Sí.

Mostrar nulos como

Configure la visualización para los valores nulos.

Comienzo de definición automática de nombre del punto desde

Configure la definición automática de nombre del punto. Este valor se usa cuando se agregan o se quitan coordenadas con el software. El nombre del punto incrementa automáticamente.

Formato pendiente

Configure el formato de la pendiente. Se lo utiliza y muestra en el software Trimble RoadLink. Las opciones son Porcentaje o Razón.

Formato pendiente talud lateral

Esto se utiliza y muestra en el software Trimble RoadLink. Las opciones son Porcentaje o Razón.

Unidades razón

Configure el orden del formato de razón que se usa y muestra en el software Trimble RoadLink software. Las opciones son Pendiente a talud o Talud a pendiente. Por ejemplo, Pendiente a talud aparece como 1:100. Talud a pendiente aparece como 100:1.

Formato estación

Configure el formato para la visualización de valores de estación en el software Trimble RoadLink. Las opciones de formato son:

  1000.0

  10+00.0

  1+000.0

  1/000.0

Unidades volumen

Configure las unidades de volumen que se utilizan y muestran en el software Trimble RoadLink. Las opciones son metros cúbicos, pies cúbicos o yardas cúbicas.

Tipo de visualización de la hora GPS

Determina el formato en el que se va a mostrar la hora. Las opciones son Hora local, Hora GPS y Horario UTC.


Diálogo Propiedades proyecto - Ficha General
Diálogo Propiedades proyecto − Ficha de Informe

Use esta ficha para ajustar las configuraciones de informe para el proyecto.

Para acceder a la misma:

1.	Seleccione Archivo / Propiedades Proyecto. Se abrirá el diálogo Propiedades Proyecto.

2.	Seleccione la ficha de Informe.

Ver informes generados

La opción Ver informes generados controla la visualización de los informes generados por operaciones tales como la importación, el recálculo y el procesamiento de códigos de característica. Los informes siempre se crean para dichas operaciones y se los almacena en la carpeta correspondiente en la carpeta Informes del proyecto.

Dichas opciones controlan la visualización de informes después de una operación de procesamiento:

Siempre	Siempre se muestra un informe de un procesamiento llevado a cabo; si no ha habido errores o avisos emitidos durante el procesamiento entonces el informe consistirá en una cabecera solamente más la información relacionada con la operación de procesamiento que se ha realizado.
Erróneo	Si se ha cometido un error durante el procesamiento, por lo que el informe de dicho procesamiento, que incluye detalles del error (o errores) encontrado(s), se presentará automáticamente.
Aviso de error	Si se ha cometido un error durante el procesamiento, se presentará un aviso para indicar que ha habido un error y que el informe puede detallar el error (o errores) presentado(s).
Nunca	No se le avisará que ha habido un error durante el procesamiento y no se presentará el informe con los detalles.
Avisar siempre	Se le avisará para ver un informe en cada procesamiento que se lleve a cabo.


Diálogo Propiedades proyecto - Ficha Recalcular
Diálogo Propiedades proyecto − Ficha Recalcular

Use esta ficha para configurar las configuraciones de recálculo para el proyecto.

Para acceder a la misma:

1.	Seleccione Archivo / Proyecto. Aparecerá el diálogo de Propiedades Proyecto.

2.	Seleccione la ficha Recalcular.

Observaciones de tomas aisladas múltiples

Use este grupo para especificar cómo un recálculo determina la posición de puntos de tomas laterales observados varias veces. Un punto de toma aislada no tiene:

  observaciones que no fluyen de los mismos

  coordenadas de control

  observaciones estáticas o estáticas rápidas que fluyen a los mismos.

Usar la mejor observación

Seleccione esta opción si no desea que el recálculo promedie las observaciones a tomas aisladas. La mejor observación para el punto se usará para determinar la posición del mismo. Esta opción está seleccionada por defecto.

Calcular la media del mismo tipo de observaciones (GPS, Convencional, Reducida, Láser)

Seleccione esta opción si desea que el recálculo promedie las coordenadas derivadas para cada observación del mismo tipo. El recálculo nunca promedia las coordenadas derivadas de un tipo de observación distinto. Por ejemplo las coordenadas determinadas de una observación convencional nunca se promediarán con aquellas determinadas por una observación GPS.

Revisión de Tolerancia

Seleccione estas casillas de verificación para usar la comprobación de tolerancia durante el proceso de recálculo. El recálculo utiliza los valores de tolerancia para determinar las coordenadas medias cuando se selecciona la opción Calcular la media del mismo tipo de observaciones.

Puede configurar las tolerancias para el Levantamiento, Cartografía, y posiciones de calidad desconocida.

Los valores de tolerancia también se usan para determinar cuándo se muestra un error de cierre para un punto que tiene múltiples fuentes de coordenadas. Si las coordenadas se han derivado de todas las observaciones  y las coordenadas están fuera de la tolerancia, se informará un error de cierre y aparecerá un indicador de aviso sobre el punto. Se mostrará un error de fuera de tolerancia en ventana Propiedades/ página Advertencia.

Horizontal

Introduzca el valor de la tolerancia para la componente horizontal para una posición.

Vertical

Introduzca el valor de la tolerancia para la componente vertical para una posición.

Reducir observaciones terrestres a elipsoide (corrección del Nivel medio del mar)

Seleccione esta casilla de verificación si desea que las distancias observadas convencionalmente se corrijan a elipsoide durante el recálculo.

Se deberán aplicar las correcciones del nivel medio del mar a menos que sepa que ya se les ha aplicado dicha corrección a las mediciones de distancia almacenadas en la base de datos o que las coordenadas introducidas sean terrestres y no coordenadas de la cuadrícula. Si no se aplica esta corrección y los datos convencionales se han capturado a una altura considerable sobre el nivel medio del mar, entonces las coordenadas calculadas no serán correctas.

Esta corrección no se aplica a los datos GPS puesto que dichos datos siempre se capturan en relación al elipsoide WGS-84.

NOTA: Si está combinando mediciones GPS y terrestres, las observaciones deberán reducirse al elipsoide.

NOTA: Se puede usar la opción Mostrar distancia como en la ficha Unidades y formato para controlar la manera en que se informan las distancia entre los puntos de la base de datos. Cuando esta opción está configurada en Distancias terreno, podrá ver cual es efectivamente la componente horizontal de una distancia medida de terreno.

Consulte más información en el tema Corrección del Nivel medio del mar.

Calidad del modelo geoidal

Seleccione la calidad para el modelo geoidal utilizada en el proyecto. Si la misma está en el orden de 5 m de precisión, seleccione Cartográfica. Si sabe que el modelo geoidal es de precisión topográfica, seleccione la opción Topográfica. El recálculo utiliza esta calidad para determinar la calidad de observaciones (para un punto GPS) o altura (para puntos terrestres) derivadas del modelo geoidal. Este campo no está disponible si no se utiliza un geoide en el sistema de coordenadas del proyecto.


Diálogo Propiedades proyecto - Ficha Características
Diálogo Propiedades proyecto − Ficha Características

Use esta ficha para especificar las configuraciones de características y atributos para el proyecto.

Para acceder a la misma:

1.	Seleccione Archivo / Proyecto. Aparecerá el diálogo de Propiedades Proyecto.

2.	Seleccione la ficha Características.

Códigos característica al importar

Seleccione la casilla de verificación códigos característica al importar para procesar automáticamente los códigos de característica cuando se importa un archivo de dispositivo. Seleccione la biblioteca de características y atributos que desea usar par procesar los códigos de característica automáticamente.

NOTA: Si selecciona esta opción aún puede procesar códigos de característica más adelante usando el menú Herramientas en la Vista del plano y seleccionar la biblioteca de características y atributos a utilizar. (No está limitado a la biblioteca seleccionada).

Biblioteca

Introduzca el nombre de la biblioteca de características y atributos que desea usar o haga clic en Examinar y ubíquela. Este campo no está disponible a menos que seleccione la casilla de verificación Codificación de características.

Usar Atributos

Para configurar el proyecto/plantilla para los atributos, seleccione la casilla de verificación Usar atributos.

Este campo sólo se refiere a la biblioteca utilizada para las definiciones de atributo.

Biblioteca

Para seleccionar la biblioteca, introduzca el camino y el nombre en el campo Biblioteca o haga clic en Examinar.

Examinar

Haga clic en Examinar y ubique el archivo Diccionario de datos (*.ddf) o de biblioteca de características y atributos (*.fcl) necesario. La carpeta por defecto es la carpeta del sistema Trimble Geomatics Office.

Si no tiene puntos que contengan características en la base de datos, podrá cambiar la biblioteca de características y atributos asociada al proyecto.

Sin embargo, una vez que importa un archivo Survey Controller (*.dc) que contiene atributos o añade atributos usando la ventana Propiedades, no podrá cambiar la biblioteca de características y atributos utilizada para configurar el proyecto para los atributos. Ello asegurará que se tengan datos de atributo compatibles en el proyecto.


Archivos de Trimble Geomatics Office - Visión de conjunto

Trimble Geomatics Office que está instalado en la computadora incluye varios archivos que almacenan diversas configuraciones acerca del sistema y cada proyecto.

ADVERTENCIA: No edite dichos archivos a menos que sea necesario. Se pueden introducir errores y Trimble Geomatics Office tal vez no funcione de la forma esperada. Si desea editar estos archivos, primero haga una copia de seguridad.

Estos archivos están divididos de la siguiente manera:

Archivos de Trimble

Los mismos están ubicados en la carpeta Archivos del programa\Archivos comunes\Trimble:

  Current.csd.

  Antenna.ini

  Receiver.ini

Archivos del sistema Trimble Geomatics Office

Los mismos están ubicados en la carpeta Archivos del programa\Trimble\Trimble Geomatics Office\Sistema:

  Asciiexp.dat

  archivo Asciiimp.dat

  Asciirpt.dat

  archivos html

  Symbols.sym

  Linetype.ltp

  Default.fcl

  archivos frm

Archivos del proyecto

Estos están ubicados en el directorio raíz de cada proyecto (por lo general C:\Trimble Geomatics Office\Proyectos\<nombre del proyecto>:

  Options.ini

  TGO_v150.mdb

  TGO_v150.dbs


Archivo Options.ini

 Véase también

Hay un archivo Options.ini asociado a cada proyecto. El mismo está ubicado en la carpeta del nombre del proyecto. Este archivo da control sobre los datos que se muestran en la ventana Propiedades, en el resumen de puntos y cabeceras del informe.

El archivo Options.ini está dividido en tres secciones

  [Resumen]

  [Informe]

  [Etiquetas]

Configuración de la definición del Resumen

La definición del Resumen en el archivo Options.ini le permite especificar los detalles de punto que se muestran en la barra de estado a medida que se seleccionan puntos, así como también la información sobre herramientas que se presenta cuando se coloca el puntero del ratón sobre un punto. Por defecto está configurada en [Nombre] : [Código característica] para que los puntos se resuman con el nombre y el código de característica.

Si prefiere que los puntos se resuman con el nombre y el estilo de punto separado por una '/', defina la sección [Resumen] del archivo Options.ini como:

Punto=[Nombre]/[Estilo de punto]

También puede asignar resúmenes específicos para las entidades de Línea, Arco, Curva y Texto. Por ejemplo, si desea que el Acimut y la Distancia se informen como el resumen para una línea, añada la siguiente definición en la sección [Resumen]:

Línea=Ac: [Acimut] Dist: [Distancia]

Se puede incluir texto junto con los códigos de campo en la especificación del resumen.

Por defecto, el resumen para líneas, arcos y curvas consiste en los resúmenes de punto para los puntos inicial y final, separados por una coma.

Configuración de la cabecera del Informe

La sección [Informe] le permite especificar una cabecera de informe estándar que se puede incluir en todos los informes producidos utilizando un único código de campo denominado [$Cabecera.Informe]. La cabecera del informe puede consistir en una combinación de texto y códigos de campo. Use ‘\n’ para indicar dónde se inicia una nueva línea. Esto le permite dividir la cabecera en varias líneas. Por ejemplo, se puede incluir el nombre de la compañía en la cabecera del informe estándar.

Configuración de la opción Etiquetas

La sección [Etiquetas] le permite añadir nuevas opciones de etiquetas que aparecerán en el diálogo Etiquetas. Para acceder a este diálogo, seleccione Ver / Etiquetas.

Se puede usar una combinación de códigos de campo y texto para definir una definición de etiqueta. Use el carácter ‘|’ para separar cada opción de etiqueta y otra vez para separar el nombre de la opción de etiqueta y el texto que se visualiza realmente como el etiqueta. Por ejemplo, directamente después de la última de las opciones de etiqueta, introduzca lo siguiente usando el teclado:

|Descripción|[descripción]

Esto añadirá una nueva opción de etiqueta en el diálogo Etiquetas denominada ‘Descripción’. Al seleccionarla, para cada punto rotulado se mostrará el valor de campo descripción.

NOTA: No se pueden definir opciones de etiqueta para líneas, curvas o arcos.


Archivo TGO_v160.mdb

 Véase también

ADVERTENCIA: Trimble Navigation Limited soporta el uso o la modificación de esta base de datos solamente mediante el uso del software Trimble Geomatics Office de propiedad de Trimble. Trimble no soporta ni autoriza el uso o modificación ni garantiza el funcionamiento de dicha base de datos mediante otras aplicaciones de software. Trimble puede en cualquier momento modificar la base de datos haciéndola incompatible con otras aplicaciones de software.

Cada proyecto tiene un archivo Microsoft Access Database (*.mdb) denominado TGO_ v160.mdb. El mismo está ubicado en la carpeta del proyecto. Este archivo contiene todos los datos del proyecto, incluyendo las tablas y consultas. Si posee Microsoft Access (Access 2000 ó posterior) podrá:

  ver los datos del proyecto

  crear sus propias consultas


Archivo TGO_v160.dbs

La primera vez que cierra un proyecto nuevo de Trimble Geomatics Office, se crea un archivo del esquema de la base de datos (*.dbs). El mismo se basa en el archivo Microsoft Access Database (*.mdb).

Tanto el archivo .dbs como el archivo .mdb están ubicados en la carpeta raíz del proyecto.

Si añade una consulta personalizada a la base de datos, tendrá que eliminar dicho archivo .dbs después de crear la consulta.

Se creará un nuevo archivo .dbs (que contiene la nueva consulta) la próxima vez que abra el proyecto y la consulta estará disponible para usarla.


Archivo Antenna.ini

Este archivo lista las antenas GPS disponibles en Trimble Geomatics Office. Otro software de Trimble, así como también el presente, utiliza dicho archivo.


Archivo Receiver.ini

Este archivo contiene una lista de receptores disponibles. No se deberá editar este archivo.


Archivo Asciiexp.dat

Este archivo está ubicado en la carpeta Archivos del programa\Trimble\Trimble Geomatics Office\Sistema.

El mismo contiene todos los formatos ASCII y para exportar personalizados de Trimble Geomatics Office. Este archivo se lee cada vez que accede al diálogo Exportar.

Para acceder a dicho diálogo, realice una de las siguientes acciones:

  Seleccione la herramienta Exportar [image].

  Seleccione Archivo / Exportar.

Los siguientes símbolos indican la ficha en que aparece el formato. En este archivo solamente se incluyen las definiciones ASCII:

Símbolo	Ficha
=	Levantamiento
+	CAD/ASCII
*	GIS
Ninguno	Personalizado

Sólo puede editar los formatos disponibles en la ficha Personalizado. Por lo tanto, si desea editar el formato de uno de los formatos disponibles en la ficha CAD/ASCII, quite el signo más (+) del inicio de la definición de formato.

Por ejemplo, la siguiente línea está incluida en el archivo Asciiexp.dat:

+coordenadas de SDRmap

Para hacer que este formato sea uno que se pueda editar, quite el signo más (+).

La próxima vez que acceda el diálogo Exportar, el formato aparecerá en la ficha Personalizado y Editar estará disponible.

De forma similar, se puede cambiar un formato personalizado a uno que no se pueda editar insertando uno de los símbolos anteriores al inicio del nombre del formato.

Por ejemplo, la siguiente línea está incluida en el archivo Asciiexp.dat:

Puntos delimitados

Cambie esta línea a:

+Puntos delimitados

La próxima vez que acceda al diálogo Exportar, el formato aparecerá en la ficha CAD/ASCII y Editar no estará disponible.


Archivo Asciiimp.dat

Este archivo está ubicado en la carpeta Archivos del programa \ Trimble \ Trimble Geomatics Office \ Sistema. El mismo contiene todos los formatos ASCII y para importar personalizados de Trimble Geomatics Office. Este archivo se lee cada vez que se accede al diálogo Importar.

Para acceder a este diálogo, realice una de las siguientes acciones:

  Seleccione la herramienta Importar [image].

  Seleccione Archivo / Importar.

Los siguientes símbolos indican la ficha en que aparece el formato. En este archivo solamente se incluyen las definiciones ASCII:

Símbolo	Ficha
=	Levantamiento
+	CAD / ASCII
Ninguno	Personalizado

Sólo puede editar los formatos disponibles en la ficha Personalizado. Por lo tanto, si desea editar el formato de uno de los formatos disponibles en la ficha CAD/ASCII, quite el signo más (+) del inicio de la definición de formato.

Por ejemplo, la siguiente línea está incluida en el archivo Asciiimp.dat:

Formato +WILDsoft

Para hacer que este formato sea uno que se pueda editar, quite el signo más (+).

La próxima vez que acceda el diálogo Importar, el formato aparecerá en la ficha Personalizado y el botón Editar estará disponible. De forma similar, se puede cambiar un formato personalizado a uno que no se pueda editar insertando uno de los símbolos anteriores al inicio del nombre del formato.

Por ejemplo, la siguiente línea está incluida en el archivo Asciiimp.dat:

Puntos delimitados

Cambie esta línea a:

+Puntos delimitados

La próxima vez que acceda al diálogo Importar, el formato aparecerá en la ficha CAD/ASCII y el botón Editar no estará disponible.


Archivo Asciirpt.dat

Este archivo está ubicado en la carpeta Archivos del programa\Trimble\Trimble Geomatics Office \ Sistema. El mismo contiene todos los formatos de informe de la base de datos para Trimble Geomatics Office. Este archivo se lee cada vez que se accede al diálogo Informes Adicionales.

Para acceder al diálogo Informes adicionales, seleccione Informes / Informes adicionales.

Se puede cambiar un formato de la base de datos del sistema del diálogo Informes adicionales a un formato que se pueda editar quitando el signo igual (=) del nombre de formato en el archivo.

Por ejemplo, la siguiente línea está incluida en el archivo Asciirpt.dat:

=Puntos

Para hacer que este formato sea uno que se pueda editar, quite el signo igual (=).

El formato aparecerá ahora en el diálogo Informes Adicionales donde se lo puede editar. De forma similar, se puede cambiar un formato personalizado del diálogo Informes Adicionales a uno que no se pueda editar insertando un signo igual (=)al inicio del nombre del formato.

Por ejemplo, la siguiente línea está incluida en el archivo Asciirpt.dat:

Lista de puntos de anchura fija

Cambie esta línea a:

=Lista de puntos de anchura fija

El formato aparecerá ahora en el diálogo Informes adicionales y no se puede editar.


Archivos .html

Varios archivos Hypertext Markup Language (de lenguaje de marcas de transferencia de hipertexto) (Hypertext markup language ) (.html) de plantilla están instalados en la carpeta Trimble Geomatics Office / Sistema. Dichas plantillas se usan para crear informes del sistema. Dichos archivos no se deben eliminar.

Los informes que Trimble Geomatics Office genera están almacenados en la carpeta Informes correspondiente del proyecto (por ejemplo Recalcular.html). Para abrir un informe .html, haga doble clic en el informe en el Explorador de Microsoft Windows. Se abrirá en el visor HTML por defecto.

NOTA: Dichos archivos .html se pueden modificar para personalizar la información que aparece en los informes del sistema. Sin embargo, Trimble no soporta o garantiza el funcionamiento esperado de archivos .html modificados. Trimble recomienda hacer una copia de seguridad de un archivo .html antes de modificarlo.


Archivo Symbols.sym

El archivo Symbols.sym está ubicado en la carpeta Archivos del programa \ Trimble \ Trimble Geomatics Office \ Sistema.

Use la utilidad Symbol Editor (Editor de símbolos) para ver y editar dicho archivo. Este archivo contiene símbolos. En Trimble Geomatics Office o en la utilidad Feature and Attribute Editor (Editor de características y atributos), se pueden crear nuevos estilos de punto usando los símbolos disponibles del archivo.

También puede crear sus propios archivos .sym. Consulte más información sobre el uso de archivos .sym en el capítulo Utilidades del Manual de Trimble Geomatics Office.


Archivo Linetype.ltp

El archivo Linetype.ltp está ubicado en la carpeta Archivos del programa \ Trimble \ Trimble Geomatics Office \ Sistema. Use la utilidad Linetype Editor (Editor de tipos de línea) para ver y editar este archivo.

Este archivo contiene tipos de línea. En Trimble Geomatics Office o en la utilidad Feature and Attribute Editor, se pueden crear nuevos estilos de línea usando los tipos de línea disponibles en el archivo.

También puede crear sus propios archivos .ltp. Consulte más información sobre el uso de archivos .ltp en el capítulo Utilidades del Manual de Trimble Geomatics Office.


Archivo Default.fcl

El archivo .fcl está ubicado en la carpeta Archivos del programa \ Trimble \ Trimble Geomatics Office \ Sistema. Para ver y editar este archivo, use la utilidad Feature and Attribute Editor. Todos los archivos .fcl son bibliotecas de características y atributos.

Este archivo contiene códigos de característica predefinidos (con y sin atributos), estilos de punto, estilos de línea, estilos de anotación y códigos de control.

Para usar este archivo:

1.	Transfiéralo a Trimble Survey Controller para capturar información de características y atributos.

2.	Use el archivo en Trimble Geomatics Office para procesar los códigos de característica y para configurar el proyecto para atributos si está capturando información de atributos.

Puede crear sus propias bibliotecas de características y atributos usando la utilidad Feature and Attribute Editor. Consulte información sobre la creación de bibliotecas de características y atributos en la Ayuda del Feature and Attribute Editor.


Archivo Current.csd

El archivo Current.csd está ubicado en la carpeta Archivos del programa \ Archivos comunes \ Trimble \ Geodata.

Current.csd es la base de datos del sistema de coordenadas de Trimble Geomatics Office. Dicho archivo se utiliza al seleccionar un sistema de coordenadas para un proyecto.

Para ver y editar este archivo, utilice la utilidad Administrador de sistemas de coordenadas™ de Trimble. Consulte más información sobre sistemas de coordenadas en la Ayuda del Administrador de sistemas de coordenadas.


Archivos .frm

Las plantillas de formato de hoja están almacenadas como archivos .frm. Los mismos se encuentran en la carpeta Trimble \ Trimble Geomatics Office \ Sistema.

Al configurar los parámetros de la hoja para imprimir o dibujar, debe seleccionar un formato de hoja a utilizar.

NOTA: Los archivos .frm son archivos de texto. Para verlos y editarlos, utilice un editor de texto.


Microsoft Access 97
Microsoft Access 2000

ADVERTENCIA: Trimble Navigation Limited soporta el uso o modificación de esta base de datos solamente mediante el uso del software Trimble Geomatics Office de propiedad de Trimble. Trimble no soporta ni autoriza el uso o modificación, ni garantiza el funcionamiento, de la base de datos mediante otras aplicaciones de software. Trimble puede modificar el formato de la base de datos en cualquier momento haciéndola incompatible con otras aplicaciones de software.

Trimble Geomatics Office usa una base de datos de Microsoft Access 2000. Si tiene una versión anterior del software Microsoft Access, no podrá abrir el archivo <proyecto>.mdb. Si tiene Microsoft Access 2000 (ó posterior) puede usar dicho software para ver los datos del proyecto y crear nuevas consultas.


Consultas de la base de datos - Visión de conjunto
Consultas de la base de datos – Visión de conjunto

Más información

 Cómo ...

ADVERTENCIA: Trimble Navigation Limited soporta el uso o modificación de esta base de datos solamente mediante el uso del software Trimble Geomatics Office de propiedad de Trimble. Trimble no soporta ni autoriza el uso o modificación, ni garantiza el funcionamiento, de la base de datos mediante otras aplicaciones de software. Trimble puede modificar el formato de la base de datos en cualquier momento haciéndola incompatible con otras aplicaciones de software.

Visión de conjunto

Trimble Geomatics Office usa la base de datos de Microsoft Access 2000. Puede utilizar Microsoft Access para crear sus propias consultas.

NOTA: Trimble no soporta consultas definidas por el usuario.

Los detalles aquí provistos suministran información limitada con respecto al diseño de consultas para utilizarlas en Trimble Geomatics Office. Si tiene que revisar estas técnicas, le sugerimos consultar la documentación que acompaña a Microsoft Access.

Definición de consultas de Microsoft Access

Por lo general, las consultas que desea definir para usar en los proyectos se pueden predefinir en las plantillas del mismo.

Se pueden exportar definiciones de consultas a otras bases de datos de Microsoft Access. Por lo tanto, si se han creado definiciones de consultas útiles en un proyecto particular, más adelante podrá exportar dichas definiciones a la(s) plantilla(s) del proyecto principal para que estén disponibles en otros proyectos de Trimble Geomatics Office.

La clave de la utilización de consultas de Microsoft Access dentro de Trimble Geomatics Office consiste en que el(los) campo(s) ID especificado(s) en la consulta definen(n) los tipos de entidad que la consulta va a seleccionar.

Dos condiciones se relacionan con el uso de campos ID en una consulta de selección:

  La consulta debe definirse con la primera columna (seleccione la columna Mostrar casilla de verificación para) que es un campo ID o toda una tabla (*opción usada).

  Si la consulta se va a diseñar para seleccionar múltiples tipos de entidad (por ejemplo, seleccionar todos los puntos asociados con las entidades de Arco), entonces los campos ID relacionados con cada una de las entidades a seleccionar deben ser los únicos campos de salida en la consulta.

Definición de consultas para Trimble Geomatics Office

Si desea definir una consulta que se va a utilizar en Trimble Geomatics Office, deberá usar un prefijo correctamente delante del nombre de la consulta para que la misma aparezca en la lista requerida.

NOTA: En el informe y en las consultas de exportación, la tabla de datos para la selección de conjunto debe tener su referencia  en el nombre de la consulta. Por ejemplo, para exportar una lista de puntos, la consulta se debe llamar Export(Point)_Point List

Si crea una consulta con fines de selección y desea que aparezca en la lista Seleccionar / Por consulta, la consulta deberá tener el prefijo Seleccionar_. Las consultas con dicho prefijo también estarán disponibles al crear informes personalizados.

Si desea diseñar una consulta solamente para un informe, utilice el prefijo Informe (Tabla de datos para el Conjunto de Selección)_. Las consultas con dicho prefijo no aparecerán en la lista Seleccionar / Por consulta.

Si desea añadir una consulta para filtrar elementos en la lista de selección de la ventana Propiedades, use el prefijo SS_ . La consulta aparecerá en la lista al hacer clic en la herramienta Filtro en la ventana Propiedades.


Especificación de parámetros para consultas en Microsoft Access

ADVERTENCIA: Trimble Navigation Limited soporta el uso o la modificación de esta base de datos solamente mediante el uso del software Trimble Geomatics Office de propiedad de Trimble. Trimble no soporta ni autoriza el uso o modificación ni garantiza el funcionamiento de dicha base de datos mediante otras aplicaciones de software. Trimble puede modificar la base de datos en cualquier momento haciéndola incompatible con otras aplicaciones de software.

Para poder usar las mismas consultas personalizadas a fin de seleccionar diferentes entidades en distintos momentos, los parámetros se pueden especificar como parte de la definición de la consulta con el software Microsoft Access.

Al especificar un parámetro, Trimble Geomatics Office le permite introducir el valor correspondiente cuando se inicia la consulta. Un ejemplo del uso de un parámetro en una consulta es la provisión de una consulta para seleccionar entidades de punto según el código de característica.

Por ejemplo, se pueden seleccionar todos los puntos con el código de característica ‘Arbol’ en una etapa y luego todos los puntos con el código de característica ‘Poste’ en una etapa posterior.

Se puede especificar un parámetro para una columna en una definición de consulta introduciendo el comando que desea mostrar entre corchetes (es decir, []), junto con la condición de comparación a satisfacer (es decir, =, >, <, Como), en el campo Criterios.

Por ejemplo, en el caso de una consulta para seleccionar puntos según el código de característica, el campo Código característica se debe añadir a la definición de consulta. El campo Criterios debe definir la condición a cumplir, por ejemplo “Como [Código]”.

En este ejemplo, el operador de comparación de cadenas Como se utiliza para comprobar códigos coincidentes.

La especificación de los parámetros de consulta se puede perfeccionar aún más. Ello le permite rellenar el campo de introducción de parámetros de Trimble Geomatics Office haciendo clic en las entidades en el modelo gráfico. Dicho perfeccionamiento se define al colocar dos puntos a continuación del comando del parámetro, luego el nombre del campo de la base de datos que se está rellenando. En el ejemplo del código anterior esto sería:
Como [Código:Código característica]

Además de definir la condición de parámetro en el campo Criterios, también se debe introducir la definición de parámetro en el diálogo de la consulta. El diálogo aparecerá en el menú abreviado cuando el puntero esté en la parte superior del diálogo de consulta.

NOTA: El campo Parámetro debe contener exactamente el mismo texto que el introducido entre corchetes en el campo Criterios.

El campo Tipo de datos para cada parámetro se configura de acuerdo con el tipo de datos que se está introduciendo. En el ejemplo anterior, puesto que el código de característica es un campo de tipo texto, el mismo se configura en Texto. Si se especifica un parámetro de tipo número verdadero tal como la altura de un punto, entonces el campo Tipo de datos debe configurarse en Doble.

Los detalles que se suministran proveen información limitada con respecto al diseño de consultas para usarlas en Trimble Geomatics Office. Si tiene que revisar dichas técnicas, le sugerimos consultar la documentación que acompaña a Microsoft Access.


Utilización de consultas personalizadas para filtrar un conjunto de selección

ADVERTENCIA: Trimble Navigation Limited soporta el uso o la modificación de esta base de datos solamente mediante el uso del software Trimble Geomatics Office de propiedad de Trimble. Trimble no soporta ni autoriza el uso o modificación ni garantiza el funcionamiento de dicha base de datos mediante otras aplicaciones de software. Trimble puede modificar la base de datos en cualquier momento haciéndola incompatible con otras aplicaciones de software.

Al usar Microsoft Access, puede generar consultas más complejas que funcionan con la tabla Datos conjunto selección y permite que la consulta de selección filtre de forma efectiva un conjunto de selección de la base de datos.

La tabla Datos conjunto selección contiene los IDs de registro de todas las entidades que están en el conjunto de selección.

Para lograr esta función de filtro, la tabla Datos conjunto selección debe estar incluida en la definición de consulta, junto con la tabla que contiene las entidades a seleccionar (por ejemplo, la tabla Punto). En este caso, el campo ID de registro en la tabla Datos conjunto selección tiene que estar unido al campo ID correspondiente en la otra tabla incluida en la consulta. Esta unión de campos en las dos tablas se puede realizar arrastrando y colocando el nombre del campo adecuado de una tabla en el nombre de campo de la otra tabla.

Al igual que con las otras consultas de selección que se comentan anteriormente, el primer campo que se muestra en la consulta debe ser un campo ID o una tabla entera. Para que la consulta seleccione sólo entidades de una tabla específica, la consulta debe definir el nombre de la tabla que contiene las entidades a seleccionar en la tabla Datos conjunto selección. Esto significa que si se están seleccionando puntos, el campo Nombre tabla, en la tabla Datos conjunto selección, se deberá añadir a la consulta, con Criterios configurado en ‘Punto’.

La tabla Datos conjunto selección contiene los IDs de registro de todas las entidades que están en un conjunto de selección. A cada conjunto se le asigna un número de identificación único que se lista en la columna ID nombre conjunto selección de la tabla Datos conjunto selección. El número 0 indica que la entidad forma parte del conjunto de selección actual, por lo que la consulta puede usar dicho valor para asegurarse de que sólo se filtra el conjunto de selección actual. Esto se hace añadiendo una columna más a la consulta que define el ID nombre conjunto selección y configurando los campos de Criterios en 0. Al configurar Criterios con otro valor, podrá realizar una selección actual basada en un conjunto de selección existente si fuera necesario.

Los detalles que se suministran proveen información limitada con respecto al diseño de consultas para usarlas en Trimble Geomatics Office. Si tiene que revisar dichas técnicas, le sugerimos consultar la documentación que acompaña a Microsoft Access.


Plantillas del proyecto - Visión de conjunto
Plantillas del proyecto − Visión de conjunto

Más información

Cómo...	Diálogo
Visión de conjunto

Al crear un nuevo proyecto se deberá seleccionar una plantilla. Una plantilla contiene todas las configuraciones, datos y estructuras de archivo. La información en la plantilla se copia al proyecto cuando lo crea. Por ejemplo, si tiene un archivo Survey Controller (*.dc) en la carpeta Comprobar de la plantilla, el proyecto tendrá el mismo archivo .dc en la carpeta Comprobar. Las ediciones que se han realizado al proyecto no se efectuarán a la plantilla.

Las plantillas son útiles para:

  seleccionar los estilos CAD que desea usar

  añadir puntos de control a la base de datos

  añadir los archivos requeridos

  seleccionar el sistema de coordenadas adecuado

  seleccionar las unidades requeridas

  seleccionar las configuraciones de puntos duplicados

Trimble provee varias plantillas con Trimble Geomatics Office. Por ejemplo, la Plantilla métrica le permite utilizar mediciones métricas en todos los proyectos creados utilizando dicha plantilla.

Las plantillas están almacenadas en la carpeta Archivos del programa\Trimble\Trimble Geomatics Office\Plantilla.


Comando Informe de recálculo

Use este comando para ver el Informe de recálculo. El informe es creado del recálculo más reciente de los datos topográficos.

Para acceder al mismo, seleccione Informes / Informe de recálculo.

El informe se muestra en el visor HTML por defecto.


Informes del sistema - Visión de conjunto
Informes del sistema − Visión de conjunto

 Véase también

Los informes del sistema se generan después de una operación de procesamiento ó cálculo de datos topográficos. Estos informes se crean en la carpeta Informes. Exceptuando el Informe para importar, cuando se genera un informe nuevo, éste sobrescribe cualquier informe existente del mismo nombre en la carpeta.

El sistema crea los siguientes informes automáticamente después de una operación de procesamiento:

  Informe para importar

  Informe de recálculo

  Informe de procesamiento de códigos característica

  Informe pegar proyecto

Para recibir notificación acerca de estos informes, seleccione la opción Mostrar informe generado en el diálogo Propiedades proyecto − Ficha Informando.

Usted puede generar los siguientes informes del sistema después de haber efectuado una operación topográfica. Estos informes proveen detalles sobre cálculos topográficos ó sobre cambios a los datos topográficos.

  Recálculo

  Informe de derivación de puntos

  Informe de procesamiento de líneas base GPS (si usted tiene instalado el módulo WAVE Baseline Processing [Procesamiento de líneas base WAVE])

  Informe de módulos de cierres GPS

  Informe de ajuste de la red (si tiene instalado el módulo Network Adjustment [Ajuste de la red])

  Informe de calibración local GPS

  Informe de transformación de coordenadas

  Informe de ajuste de elevación

  Informe de inversos

  Informe renombrar puntos

  Informe de nivel

NOTA: La disponibilidad de algunos informes depende de los módulos (Baseline Processing y Newtwork Adjustment) que se hayan instalado.


Informe base de datos - Visión de conjunto
Informe base de datos − Visión de conjunto

 Véase también

Los Informes base de datos son informes que se generan de los registros de tablas primarias y consultas definidas en la base de datos. Es decir, presentan información de la base de datos del proyecto.

Estos informes son útiles si quiere obtener un resumen del proyecto o proveer informes para clientes.

Los Informes base de datos se clasifican en dos categorías:

  informes de la base de datos del sistema

  informes personalizados

Ambos informes se obtienen en el diálogo Informes adicionales)

Un informe de la base de datos existente que provee Trimble Geomatics Office se puede usar o modificar o personalizar su propio formato de informe.


Informes - Visión de conjunto
Informes − Visión de conjunto

Trimble Geomatics Office genera todos los informes en formato de lenguaje de marcas de transferencia de hipertexto (Hypertext markup language ) (HTML) y los muestra en un visor HTML instalado en su computadora. Por lo general, el visor HTML por defecto será un buscador Web.

Todos los informes se crean en la carpeta Informes en el directorio Trimble Geomatics Office\Proyectos. Los informes están organizados en carpetas con el nombre del tipo de informe. Con la excepción del Informe para importar, cuando se genera un informe nuevo, éste sobrescribe cualquier informe del mismo nombre en la carpeta.

Se pueden generar dos tipos de informe:

  Informes del sistema

  Informes base de datos

Se puede acceder a los informes usados normalmente en el menú Informes. La disponibilidad de algunos informes del sistema depende de los módulos (Baseline Processing y Network Adjustment) que se hayan instalado y si el informe ha sido generado.

NOTA: Los informes de Trimble Geomatics Office no se pueden ver en el Explorador de Internet de Microsoft versión 2.ó 3. Si tiene alguna de estas versiones, Trimble le recomienda que instale el Explorador de Internet de Microsoft 4 ó 5 de la Web.


Buscador Web Explorador de Internet de Microsoft - Visor de informes
Buscador Web Explorador de Internet de Microsoft − Visor de informes

El buscador Web Explorador de Internet de Microsoft está disponible en la Web, si no tiene un visor HTML instalado. Dicho buscador le permite ver e imprimir el informe que ha creado. Se pueden usar las otras características útiles del buscador para satisfacer los objetivos del informe.

Personalización del aspecto del informe

Los informes de Trimble Geomatics Office se muestran en un formato estandarizado. Las fuentes, el tamaño de las mismas, los colores y los fondos son iguales en todos los informes. Dichas configuraciones se pueden anular según sus preferencias. Hágalo si  quiere mostrar el informe en un formato que le sea más fácil de leer.

SUGERENCIA: Para cambiar el fondo del informe, reemplace el archivo backgrnd.gif con otro archivo de gráficos CompuServe Graphics Interchange (GIF) del mismo nombre en la carpeta Informes.

Se pueden definir las opciones de impresión para evitar que el fondo se imprima. Esta opción está, por defecto, inhabilitada.

Abrirlo en otra aplicación de software

Muchas aplicaciones de software soportan documentos con formato HTML. Además, se puede guardar el informe como archivo de Texto (* .txt) para abrirlo en otra aplicación tal como un editor de texto, hoja de cálculo o procesador de texto. También puede copiar una porción del informe en el portapapeles y pegarlo en otra aplicación de software.

Estas características pueden ser útiles si quiere insertar el informe en un documento, editar el contenido del informe ó usar los datos para realizar cálculos adicionales en otra aplicación.

Consulte información sobre cómo usar las opciones del Explorador de Internet de Microsoft para sus informes en la Ayuda del Explorador de Internet.


Diálogo Definir Formato informe

Use este diálogo para definir un formato de informe.

Para acceder al mismo:

1.	Seleccione Informes / Informes adicionales. Aparecerá el diálogo Informes adicionales.

2.	Elija una de las siguientes opciones:

  Haga clic en Nuevo para definir un formato de informe nuevo.

  Elija un formato de informe existente de la lista Informes y haga clic en Editar para modificar el formato seleccionado.

NOTA: No se podrán editar Informes de puntos, de rangos de elevación, de detalles del sistema de coordenadas y de comparación de puntos.

Nombre

Introduzca el nombre del formato de informe. Este nombre aparece en la lista de Informes del diálogo Informes personalizados. No se permiten nombres duplicados.

Cadena Nula

La Cadena nula muestra la cadena nula que ha sido especificada en Archivo / Propiedades proyecto / ficha Unidades y formato. La cadena especificada en este campo se usa en los campos del informe personalizado generado que tienen un valor nulo. Este campo es opcional.

Descripción

En este campo se puede introducir una descripción del formato de informe. Esta descripción aparece en la barra de estado. Este campo es opcional.

Extensión por defecto

La Extensión por defecto no se usa en la definición de un formato de informe.

Informe sobre

Seleccione una de las tablas primarias o consultas como la fuente para el informe. La fuente por defecto es el Registro de información del punto. Esto le permite informar cualquier registro de la tabla de punto.

Rellenar formato automáticamente

Haga clic en Rellenar formato automáticamente para inicializar el título y cuerpo automáticamente. Consulte más información en Rellenar formato automáticamente.

Cabecera del formato

Introduzca el texto fijo y las definiciones del código de campo (disponibles en el menú abreviado) que habrán de constituir la cabecera del informe. Este campo es opcional y no necesita tener una definición especificada.

Presione Enter para añadir líneas en blanco en la definición de cabecera.

Cuerpo del formato

Introduzca las definiciones de código de campo apropiadas (disponible del menú abreviado) para indicar los datos que Trimble Geomatics Office debe informar del proyecto.

Por ejemplo, para generar un informe de puntos de anchura fija use el formato siguiente:

[Nombre:10][Primera ordenada:14.3][Segunda ordenada:14.3][Elevación:14.3][Código Característica:20]

La cabecera del formato o el cuerpo del formato (pero no los dos) se puede dejar en blanco.

Pie del formato

Introduzca el texto fijo y las definiciones del código de campo (disponible en el menú abreviado) que han de constituir el pie del informe. Este campo es opcional y no necesita tener una definición especificada. Por ejemplo, use este pie para mostrar un EOF (comando fin de archivo)

Oprima la tecla Enter para añadir líneas en blanco a la definición del pie.

Consulte más información sobre todos los códigos de campo disponibles en el sistema en Códigos de campo − Visión de conjunto.


Informe de recálculo - Visión de conjunto
Informe de recálculo − Visión de conjunto

El Informe de recálculo es un informe de lenguaje de marcas de transferencia de hipertexto (Hypertext markup language ) (HTML) que resume los resultados del proceso de recálculo. Utilice el Informe de recálculo para eliminar los indicadores de advertencia:

  comprobando los detalles de la ocupación

  comprobando que los puntos se hayan renombrado correctamente

  inhabilitando la coordenada si sospecha que ha sido tecleada incorrectamente

  volviendo a observar si fuera necesario

El Informe de recálculo informa sobre lo siguiente:

  Errores de tolerancia donde observaciones múltiples ó coordenadas resultan en posiciones fuera de tolerancia. (Las tolerancias se definen en la ficha Recalcular del diálogo Propiedades proyecto.)

  Cierres donde más de una observación ó conjunto de coordenadas tecleadas podrían ser usadas para determinar la posición calculada del punto y las posiciones están dentro de la tolerancia

  Observaciones sin usar y errores.

  Las coordenadas iniciales y el orden en que las coordenadas fueron derivadas.

  Observaciones y coordenadas referenciadas en el informe

Trimble Geomatics Office crea un Informe de recálculo cada vez que se hace un recálculo. La manera en que se le notifica que se ha creado un Informe de recálculo depende del campo Ver informe generado en la ficha Informando del diálogo Propiedades Proyecto. El informe de Recálculo siempre está almacenado en la carpeta Informes del proyecto. Como todos los informes del sistema, si ya existe un informe, el nuevo informe sobrescribirá al informe antiguo.

El Informe de Recálculo incluye las siguientes partes:

  Detalles proyecto

  Errores

  Advertencias

  Cierres

  Derivación de puntos

  Puntos de inicio

  Informe poligonal

  Datos topográficos (observaciones y coordenadas)


Informe de recálculo - Sección Detalles proyecto
Informe de recálculo − Sección Detalles proyecto

La sección Detalles proyecto del Informe de recálculo resume el nombre del proyecto y los detalles del sistema de coordenadas.


Informe de recálculo - Secciones Error y Advertencia

Las secciones Error y Advertencia del Informe de recálculo lista todos los puntos donde se deriva más de un conjunto de coordenadas para un punto y estas coordenadas están fuera de tolerancia. También muestran las observaciones que no se utilizan y los puntos que no se pueden coordinar.

Use estas secciones para examinar los errores y advertencias y para decidir si debe revisar el proyecto para resolverlos. Para ver la derivación de un punto, haga clic en el mismo. Esto le llevará a Sección derivación de puntos.

También se muestran las tolerancias horizontal y vertical. Estas se configuran en el diálogo Propiedades proyecto − Ficha Recalcular.


Informe de recálculo - Sección Derivación de puntos
Informe de recálculo − Sección Derivación de puntos

La sección Derivación de puntos del Informe de recálculo muestra la posición calculada para un punto. Sólo se informa la derivación de puntos con errores o cierres incluidos en el Informe de recálculo. Se muestran las calidades del componente horizontal (Falso norte, Falso este), del componente elevación y del componente altura para la posición calculada.

Debajo de la posición calculada y las calidades hay una lista de datos topográficos que podrían usarse para coordinar el punto.

Cada observación muestra:

  el tipo de observación

  el ID de la observación

  los puntos ″de″ y ″a″

Para ver los detalles de la observación, haga clic en el ID. Este está vinculado a la Sección datos topográficos del informe de recálculo.

Para seleccionar la observación en la ventana de gráficos (y la ventana Propiedades),), seleccione el icono a la izquierda del ID de la observación. Este vínculo le permite ver observaciones fácilmente con cierres fuera de tolerancia en la vista del levantamiento.

Cada coordenada muestra:

  el tipo de coordenada (cuadrícula, geodésica o solución de posición)

  la fuente de la coordenada

  el ID de la coordenada

Para ver los detalles de coordenada, haga clic en el ID. Este está vinculado a la sección Datos topográficos del Informe de recálculo.

Nuevamente, para seleccionar el punto en la ventana de gráficos y la ventana Propiedades, seleccione el icono a la izquierda del ID de la observación.

La columna Usado para calc. muestra los componentes de la posición (NE,e,a) que fueron calculados de la observación o coordenada. Por ejemplo, si una observación determina los componentes Norte, Este y altura para el punto y la coordenada determina la elevación, la columna Usado para calc muestra NEa junto a la observación GPS y e junto a la coordenada.

Las columnas Incremento Norte, Incremento Este, Incremento elevación e Incremento altura elipsoidal muestran la diferencia entre la posición calculada final y la posición calculada usando sólo la observación o coordenada.

Si los valores de incremento son mayores que la configuración de tolerancia especificada para el proyecto, aparecerán indicadores y los números se tornarán rojos. Las observaciones marcadas con rojo no necesariamente indican una observación o coordenadas tecleadas incorrectas; el recálculo pudo haber usado una observación o grupo de coordenadas tecleadas incorrectas. Se debe de determinar la causa del error e inhabilitar cualquier observación mala.

Use la sección topográfica del informe para examinar cada observación.

SUGERENCIA: Puede utilizar la ventana Propiedades y el comando Informes / Informe de derivación de puntos para ver el informe de derivación de los puntos en el proyecto, incluso puntos no incluidos en el Informe de recálculo.


Informe de recálculo - Sección Informe poligonal

La sección Informe poligonal del Informe de recálculo muestra como el recálculo traza la poligonal desde el punto de inicio y las observaciones que utiliza.

Una poligonal se informará solamente si hay más de un tramo desde el punto inicial. Esto es para evitar que se informe sobre distancias al eje.

Por ejemplo, si las observaciones son:

  Del punto inicial 1 − al punto 2 − al punto 3 y luego de vuelta al punto 1, la misma se informará.

  Del punto inicial 1 − al punto 2, no se informará.


Informe de recálculo - Sección Cierres
Informe de recálculo − Sección Cierres

La sección Cierres del Informe de recálculo muestra la lista de puntos de estación con observaciones múltiples a un punto que están dentro de la tolerancia especificada para el proyecto. Se muestran los cierres de todos los datos de medición para el punto en las columnas incremento Norte, Este, Elevación y Altura elipsoidal.

Haga clic en un punto para ver los detalles de derivación. Este está vinculado a la sección Derivación de puntos.


Informe de recálculo - Sección Datos topográficos
Informe de recálculo − Sección Datos topográficos

La sección Datos topográficos muestra todas las observaciones y coordenadas para los puntos que se muestran en el Informe de recálculo. Los datos topográficos están organizados según el tipo de observación. Use esta sección cuando esté intentando determinar las observaciones incorrectas.

Sólo se listan las observaciones y coordenadas referenciadas en el Informe de recálculo. Se pueden ver todos los datos topográficos en la ventana Propiedades.


Informe de recálculo - Sección Puntos de inicio
Informe de recálculo − Sección Puntos de inicio

La sección Puntos de inicio del Informe de recálculo muestra los puntos desde los que el recálculo ha empezado a fluir observaciones.


Informe de recálculo - Detalles del sistema de coordenadas adicionales
Informe de recálculo − Detalles del sistema de coordenadas adicionales

La sección Detalles del sistema de coordenadas adicionales lista información sobre las configuraciones del ajuste local.

Las configuraciones del ajuste local están configuradas en el diálogo Propiedades proyecto − Ficha Sistema de coordenadas.


Comando Informe de derivación de puntos

Use este comando para ver el Informe de derivación de puntos para el(los) punto(s) seleccionado(s).

Para acceder al mismo:

1. 	Seleccione el(los) punto(s) que quiere ver.

2. 	Seleccione Informes / Informe de derivación de puntos.

Se mostrará el Informe de derivación de puntos en el visor HTML por defecto.


Informe de derivación de puntos

El Informe de derivación de puntos es una sección del Informe de recálculo que muestra la posición calculada para un punto. Se mostrarán las calidades del componente horizontal (Falso norte, Falso este), del componente elevación y del componente altura para la sección calculada.

El formato del informe es igual al de la sección Derivación de puntos del Informe de recálculo.

Para acceder al informe:

1. 	Seleccione el(los) punto(s) que quiere ver.

2. 	Opte por una de las siguientes opciones:

  Seleccione Informes / Informe de derivación de puntos.

  Abra la ventana Propiedades / Ficha Levantamiento / Página Resumen y seleccione la herramienta Derivación de puntos  [image].

El informe se mostrará en el visor HTML

NOTA: Para seleccionar un punto en la vista del levantamiento, haga clic en el punto o icono de observación a la izquierda del ID. Esto es útil para vincularse al punto en la vista del levantamiento.


Comando Informe de inversos

Use este comando para ver el Informe de inversos más reciente generado del diálogo Inverso después de haber calculado un inverso.

Para acceder al mismo:

  Seleccione Informes / Informe de inversos.

El informe se mostrará en el visor HTML por defecto.


Informe de inversos

El Informe de inversos se puede generar después de un cálculo de inverso y muestra información breve, detallada o combinada sobre el inverso.

El Informe de inversos breve muestra el acimut de la cuadrícula, la distancia de la cuadrícula y el incremento de elevación entre los puntos "de" y "a" usados para definir el inverso.

El informe detallado muestra las posiciones de los puntos "de" y "a" en sistemas de coordenada de cuadrícula, local (geodésico) y cartesiano (WGS-84), y los parámetros del inverso calculados.

Use el diálogo Inverso para generar el informe.

Después de haber creado un informe, se podrá ver el informe más reciente en cualquier momento seleccionando Informes / Informe de inversos.


Informe renombrar puntos

El Informe renombrar puntos es un informe que se puede generar para mostrar los nombres de puntos originales y nuevos, después de usar el comando Renombrar puntos.

Use el diálogo Renombrar para generar el informe.


Informes para importar

Cada vez que un archivo se transfiere a un proyecto, Trimble Geomatics Office crea un Informe para importar para cada archivo importado. Este se designa <nombre del archivo importado> .html. El mismo contiene las siguientes secciones:

Detalles proyecto

Esta sección resume el nombre del proyecto y detalles del sistema de coordenada.

Mensajes

Esta sección muestra cualquier mensaje que ha ocurrido al importar. Si no se produce ningún mensaje al importar, esta sección no se mostrará.

Informe de recálculo

El informe incluye un vínculo al Informe de recálculo generado automáticamente después del proceso de importación. El Informe de recálculo resume los resultados del proceso de recálculo.

Informe de procesamiento de códigos característica

El informe incluye un vínculo al informe de procesamiento de códigos característica, si se procesaron los códigos de característica al importar.

NOTA: Si los vínculos al Informe de recálculo o al Informe de procesamiento de códigos característica se muestran en rojo, entonces esto indica que se encontraron errores durante el proceso y que se muestran en los informes.

Durante el proceso de importación, también se crea un informe Archivos importados denominado Import.html. Este informe lista todos los archivos que se importan al proyecto. Todos los archivos que se importan al mismo proyecto en otra sesión se añadirán automáticamente a este informe.

La manera en que se le notifica sobre estos informes está definida por la opción Ver informe generado en el diálogo Propiedades Proyecto − Ficha Informando.


Comando Informes adicionales

Use este comando para generar los informes de la base de datos del sistema o personalizados suministrados por Trimble Geomatics Office.

Para acceder al mismo, seleccione Informes / Informes adicionales. Aparecerá el diálogo Informes adicionales.


Diálogo Informes adicionales

Use este diálogo para generar informes de la base de datos del sistema o personalizados suministrados por Trimble Geomatics Office. Para acceder a este diálogo, seleccione Informes / Informes adicionales

Informes de la base de datos del sistema

Los informes de la base de datos del sistema son informes con formato predefinido que dan un resumen del proyecto actual. A pesar de que por lo general los informes no se pueden editar, los formatos de informe se podrán editar. Para hacerlo, edite el archivo Asciirpt.dat ubicado en la carpeta Archivos del programa\Trimble\Trimble Geomatics Office\Sistema.

Informes personalizados

Los informes personalizados usan las consultas o tipos de informe primarios definidos en la base de datos, según las especificaciones.

Un formato de informe personalizado se podrá crear, definir o editar. Sin embargo, también se podrá evitar que estos formatos de informe se editen, al editar el archivo Asciirpt.dat ubicado en la carpeta Archivos del programa\Trimble\Trimble Geomatics Office\Sistema.

Si el nombre del informe que desea ejecutar está seguido de puntos suspensivos, entonces primero deberá introducir cierta información. Por ejemplo, cuando opte por ejecutar un Informe de elevación, Trimble Geomatics Office le pedirá introducir una elevación mínima y máxima.

Informe sobre

Hay dos opciones para informar sobre entidades elegidas o tipos de registro:

Selección	Seleccione esta opción para informar sobre entidades seleccionadas o tipos de registro.
Toda la base de datos	Seleccione esta opción para informar sobre todas las entidades o tipos de registro.
Cuando no se seleccionada nada, estos botones no están disponibles y todas las entidades o tipos de registro se incluyen en el informe.

NOTA: Cuando se selecciona el Informe de detalles del sistema de coordenadas, esta opción no estará disponible.

Ordenar datos

Se podrá elegir el orden en que se informan los datos.

Para hacerlo:

1.	Seleccione la casilla de verificación Ordenar datos.

2.	Seleccione un orden de la lista. Podrá optar por ordenar por:

Orden de base de datos	Elevación
Nombre	Calidad
Hora de inicio	Tipo de datos
Longitud de ocupación
NOTA: Las mismas opciones para ordenar están disponibles en la ventana Propiedades.

SUGERENCIA: Si crea sus propias consultas para ordenar, éstas también se mostrarán en esta lista

Informes

El grupo Informes lista los informes de la base de datos o personalizados. Ya se han definido diversos informes para utilizarlos en Trimble Geomatics Office.

Aceptar

Genera el informe y lo muestra en el visor HTML por defecto.

Nuevo

Crea y define un nuevo formato de informe.

Editar

Modifica un formato de informe existente.

Eliminar

Elimina un informe. Se le pedirá confirmar la acción.

NOTA: Los valores de separación que se introducen se interpretan con respecto a las unidades de coordenadas de la base de datos en lugar de las unidades de visualización actuales. Las unidades de la base de datos se configuran sobre la base de las unidades de visualización en el momento en que los primeros datos se guardan en la base de datos.

SUGERENCIA: Dichos informes se pueden modificar editando el archivo Asciirpt.dat ubicado en la carpeta Archivos del programa \Trimble\Trimble Geomatics Office\Sistema, usando un editor de texto.


    Comando Informe de calibración local GPS

Use este comando para ver el Informe de calibración local GPS más reciente generado del diálogo Calibración local GPS después de un cálculo de calibración.

Para acceder al mismo, seleccione Informes / Informe de calibración local GPS.

El informe se mostrará en el visor HTML por defecto.

NOTA: Este comando no está disponible en la Vista del levantamiento.

Para acceder al Informe de calibración local GPS en la vista del levantamiento, haga clic en Informe en el diálogo Calibración local GPS.


Informe de calibración local GPS

El Informe de calibración local GPS se genera después de un cálculo de calibración. El mismo muestra todos los parámetros calculados así como también una lista de las posiciones de puntos calculados, comparados con las posiciones conocidas y valores residuales individuales.

Use el diálogo Calibración local GPS para generar el informe.


Comando Informe de transformación de coordenadas

Use este comando para ver el Informe de transformación de coordenadas más reciente generado en el diálogo Transformación de coordenadas después de un cálculo de transformación.

Para acceder al mismo, seleccione Informes / Informe de transformación de coordenadas.

El informe se mostrará en el buscador Web Explorador de Internet de Microsoft.

NOTA: Este comando de menú no está en la Vista del levantamiento. Para generar el informe de la Vista del levantamiento, seleccione la casilla de verificación Generar el informe de transformación de coordenadas en el diálogo Transformación de coordenadas.


Informe de transformación de coordenadas

El Informe de transformación de coordenadas se genera después de un cálculo de transformación de coordenadas y muestra las coordenadas originales y las transformadas.

Use el diálogo Transformación de coordenadas para generar el informe.

Después de haber creado un informe, podrá ver el informe más reciente en cualquier momento seleccionando Informes / Informe de transformación de coordenadas en la Vista del plano.


Comando Informe de ajuste de elevación

Use este comando para ver el Informe de ajuste de elevación más reciente generado en el diálogo Ajuste de elevación, después de ejecutar un ajuste.

Para acceder al mismo, seleccione Informes / Informe de ajuste de elevación.

El informe se mostrará en el visor HTML por defecto.

NOTA: Este comando no está, por defecto, disponible en la Vista del levantamiento. Para generar el informe en la Vista del levantamiento, seleccione la casilla de verificación Generar el informe de ajuste de elevación en el diálogo Ajuste elevación.


Informe de ajuste de elevación

El Informe de ajuste de elevación se genera después de realizar un ajuste de elevación y muestra las coordenadas originales y las ajustadas

Use el diálogo Ajuste elevación para generar el informe.

Después de haber creado un informe, podrá ver el informe más reciente en cualquier momento seleccionando Informes / Informe de ajuste de elevación en la Vista del plano.


Informe de procesamiento de códigos característica

El Informe de procesamiento de códigos característica se genera después de una operación de procesamiento de códigos de característica.

Al definir la opción Ver informe generado en el diálogo Propiedades proyecto − Ficha General se le notificará cuando este informe se genera.

El informe resume la operación del procesamiento e incluye detalles sobre el archivo de biblioteca de códigos de característica y atributos (.fcl) usado y cualquier problema encontrado al procesar los códigos de característica.


Informe pegar proyecto

El Informe pegar proyecto se genera después de que los puntos se han copiado y pegado a un proyecto.

Al definir la opción Ver informe generado en el diálogo Propiedades proyecto − Ficha General se le notificará cuando este informe se genera.

El informe resume las características y atributos asignados a un punto copiado que no se han pegado, si las definiciones de atributo entre los proyectos difieren.


Comando Informe de nivel

Use este comando para ver el Informe de nivel para el archivo seleccionado.

Para acceder al mismo:

1.	Seleccione Informes / Informe de nivel.

2.	Seleccione el archivo de nivel.

El Informe de nivel para el archivo de nivel que ha seleccionado se mostrará en el visor HTML por defecto.


Informe de nivel

El Informe de nivel muestra las observaciones de nivel y los datos para el archivo de nivel.

Para acceder al informe:

1.	Seleccione Informes / Informes de nivel.

2.	Seleccione el archivo de nivel.

El informe se mostrará en el visor HTML por defecto. El mismo muestra la siguiente información:

Datos nivel

Esta sección muestra la serie de nivel con un formato de libro de campo de nivel. El mismo muestra la visual de referencia, la visual intermedia, las observaciones de la visual hacia adelante e información de la elevación calculada que se mostraba en el diálogo Importar nivel digital.

Observaciones nivel

La tabla de observaciones de nivel mostrará la siguiente información:

  ID

  Desde punto

  Al punto

  Calidad

  Δ Elevación − estos valores se calcularán entre puntos de estación.

SUGERENCIA: Para seleccionar la observación de nivel en la ventana de gráficos, seleccione el ID de observación. Este vínculo le permite ver la observación de nivel con facilidad en la ventana Propiedades .

NOTA: El Informe de nivel se almacenará en la carpeta <Nombre del proyecto>\Informes\Nivel.


Comando Todos

Utilice este comando para seleccionar todas las entidades del proyecto actual.

Para acceder al mismo, elija Seleccionar / Todos.

Vista del levantamiento

Si está trabajando en la vista del levantamiento, se seleccionan todas las entidades visibles.

Por ejemplo, si utiliza el comando Ver / Filtros para ocultar algunas observaciones, y a continuación utiliza el comando Seleccionar / Todos, no se seleccionan las observaciones ocultas.

Vista del plano

Si está trabajando en la vista del plano, se seleccionan todas las entidades que estén en la capa que:

  tenga la propiedad Visible habilitada

  tenga la propiedad Bloqueada inhabilitada

Por ejemplo, si utiliza la herramienta de selección de capas

para habilitar la propiedad bloqueada de una capa, y a continuación utiliza el comando Seleccionar / Todos, no se seleccionará ninguna de las entidades de la capa bloqueada.

SUGERENCIA: La barra de estado muestra un resumen de las diversas entidades seleccionadas.


Comando Ninguno

Utilice este comando para borrar la selección.

Para acceder al mismo, elija Seleccionar / Ninguno.

SUGERENCIA: La barra de estado muestra un mensaje que indica que no hay ninguna selección.


Comando Puntos

Utilice este comando para abrir el diálogo Seleccionar puntos.

Para acceder al mismo, elija Seleccionar / Puntos.


Diálogo Seleccionar puntos

Visión de conjunto	Cómo ...

Use este diálogo para seleccionar puntos utilizando el criterio especificado. Usted puede utilizar comodines y rangos. Asimismo puede introducir el criterio en varias fichas. Trimble Geomatics Office sólo selecciona los puntos que cumplen con el criterio.

Para acceder al mismo, elija Seleccionar / Puntos.

Si accede a este diálogo utilizando la vista del levantamiento, Trimble Geomatics Office sólo considera los puntos actualmente visibles. Esto significa que si usted ha utilizado el diálogo Filtros de vista para filtrar observaciones, estos no se seleccionarán. Cuando utilice la vista del levantamiento, la información de capa (que está disponible en la vista del plano) se ignora en el criterio de selección.

Si accede a este diálogo utilizando la vista del plano, Trimble Geomatics Office sólo considera los puntos actualmente visibles y no bloqueados. Cuando utilice la vista del plano, todos los filtros de vista aplicados en la vista del levantamiento se ignoran.

Las fichas son:

  General

  GPS

  Ocupación

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


Diálogo Seleccionar puntos - Ficha General
Diálogo Seleccionar puntos − Ficha General

Utilice esta ficha para introducir el criterio para los campos de punto generales.

Emparejamiento por nombre y por código de característica

Utilice estos campos para seleccionar por nombre (y código de característica). Pueden introducirse nombres separados por una coma. Por ejemplo “100,250,1020”, selecciona estos nombres de forma individual si es que existen en el proyecto. Los puntos suspensivos (..) o un guión (-) seleccionan todos los puntos con el nombre especificado en el rango.

Con un rango que incluya nombres alfanuméricos, puede que se seleccione alguna entidad imprevista ya que se utiliza un ordenamiento alfabético completo.

NOTA: Si los nombres del principio y final del rango son numéricos, se selecciona un grupo numérico.

En estos campos se pueden utilizar comodines.

NOTA: Cuando el nombre contenga un guión, ponga el guión entre comillas. Por ejemplo, el nombre de punto “a-2” se introduce como “a-2”. De lo contrario, Trimble Geomatics Office ordena el rango desde ‘a a 2’.

Use comillas dobles para evitar que se emparejen nombres que contengan caracteres de comodín. Por ejemplo, "URS#1"..."URS#8" evita que se utilice # como comodín en el rango de selección, y selecciona el grupo de puntos que tengan nombres que se encuentren entre URS#1 y URS#8, y no los empareja según el patrón.

Los nombres no son sensibles al contexto.

Con calidad(es) de punto

Seleccione de la lista el componente de calidad de punto de su criterio. Puede seleccionar calidades de punto múltiples.

De origen(es)

Seleccione de la lista las fuentes de puntos. Puede seleccionar archivos múltiples. Se seleccionarán puntos con datos topográficos que procedan por lo menos de una de las fuentes elegidas.

Con código característica

Introduzca el códigos (o códigos) de característica a utilizar para seleccionar puntos.

De capa(s)

Esta opción no está disponible cuando acceda a este diálogo desde la vista del levantamiento.

Use la lista para seleccionar capas que cumplan con su criterio. Puede seleccionar capas múltiples. Se seleccionarán todos los puntos de las capas seleccionadas.

Con estilo(s) punto

Use la lista para seleccionar estilos de punto CAD de su criterio. Puede seleccionar estilos de punto múltiples. Se seleccionarán todos los puntos con el estilo de punto especificado en la ventana Propiedades – ficha CAD.

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


Diálogo Seleccionar puntos - Ficha GPS
Diálogo Seleccionar puntos − Ficha GPS

Utilice esta ficha para introducir el criterio de selección utilizando datos GPS. Los criterios se aplican tanto a las líneas base GPS RTK como a las posprocesadas.

Un punto se selecciona, en cuanto tenga una línea base que cumpla con el criterio.

Precisión horizontal, Precisión vertical

Haga clic en el botón menor e igual que o mayor e igual que para seleccionar el signo de su criterio.

Introduzca los valores de precisión utilizando el teclado.

Si deja uno de los campos con un signo de interrogación (?), dicho campo no se utilizará en el criterio de selección.

Tipo(s) de solución

Para utilizar tipos de solución en su criterio, selecciónelos de la lista. Puede seleccionar tipos de solución múltiples. Se seleccionan todos los puntos con observaciones GPS (con los tipos de solución seleccionados).

Método(s) campo

De la lista, seleccione el método de campo que quiere utilizar en su criterio. Puede seleccionar métodos de campo múltiples.

NOTA: Sólo se seleccionan los puntos que satisfagan tanto el tipo de solución como el método de campo.

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


Diálogo Seleccionar puntos - Ficha Ocupación
Diálogo Seleccionar puntos − Ficha Ocupación

Utilice esta ficha para introducir el criterio de selección utilizando información de ocupación. Se seleccionarán todos los puntos que tengan por lo menos una ocupación que satisfaga el criterio.

Todas las estaciones base y configuraciones instrumento

Seleccione esta casilla de verificación para elegir todos los puntos de estación base GPS y puntos de instalación terrestre.

Con alturas antena o destino entre

Utilice estos campos para introducir un rango de altura de antena o altura de destino a utilizar en su criterio. El valor que introduzca en el primer campo debe ser menor que el valor que introduzca en el segundo. Se incluyen todos los valores que introduzca.

Ocupadas entre horas

Seleccione esta casilla de verificación para introducir un rango de hora y fecha a utilizar en su criterio. Se seleccionan las ocupaciones de los puntos cuyos tiempos de inicio y final se encuentren en el rango especificado. El software guardará los valores que se introduzcan la próxima vez que utilice esta opción.

Observado/a desde punto

Introduzca un nombre de punto a partir del cual se hayan efectuado observaciones. El punto puede ser una estación base GPS, o un punto terrestre.

Utilice Rellenar campo para seleccionar un punto en la ventana gráfica.

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


Selección de entidades - Utilización de comodines
Selección de entidades − Utilización de comodines

 Visión de conjunto y más información

Cuando se seleccionen puntos utilizando el diálogo Seleccionar / Puntos, o se seleccionen observaciones usando el diálogo Seleccionar / Observaciones, puede utilizar comodines en algunos campos para seleccionar un conjunto de valores.

Puede utilizar los siguientes comodines:

También puede usar comodines múltiples. Por ejemplo, 1?0*0 coincide con 1500, 1A0250, 15020.

La tabla siguiente muestra cómo puede utilizar estos tipos de emparejamiento para probar los patrones:

Se considera que el nombre de punto ″10″ está comprendido entre ″1″ y ″a″. Por ello, no entrará en el rango ″1″ a ″9″ ya que ambos nombres son numéricos.


    Comando Observaciones

Utilice este comando para abrir el diálogo Seleccionar observaciones.

Para acceder al mismo, elija Seleccionar / Observaciones.


    Diálogo Seleccionar observaciones

Más información

Visión de conjunto	Cómo ...

Para acceder al mismo, elija Seleccionar / Observaciones.

Utilice este diálogo para seleccionar observaciones utilizando el criterio especificado. Puede usar comodines y rangos. También puede introducir criterios en más de una ficha. Trimble Geomatics Office sólo selecciona las observaciones que cumplen con todos los criterios.

Las fichas son:

  General

  GPS

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


Diálogo Seleccionar observaciones - Ficha General
    Diálogo Seleccionar observaciones − Ficha General

Utilice esta ficha para introducir los criterios generales para la selección de observaciones.

De estación coincidente, A estación coincidente

Pueden introducirse nombres separados por comas. Los puntos suspensivos (…) o un guión  (-) seleccionan todas las líneas base con el nombre especificado del rango denotado por la elipsis. Con un rango que incluya nombres alfanuméricos, pueden seleccionarse algunas entidades imprevistas ya que se utiliza un ordenamiento alfabético completo.

NOTA: Si los nombres inicial y final del rango son valores numéricos, se selecciona un rango numérico.

Puede utilizar comodines.

Con distancia inclinada entre

Utilice estos campos para introducir en su criterio un rango de distancia inclinada. El valor que introduzca en el primer campo debe ser menor que el que introduzca en el segundo. Los valores que introduzca son inclusivos.

Si dispone de una observación reducida con una distancia horizontal que se encuentre en el rango especificado, también se seleccionarán las observaciones.

Seleccione el tipo de observación en esta lista.  Por ejemplo, se podrá seleccionar RTK, Láser u Observaciones de acimut.

De origen(es)

De la lista, seleccione la(s) fuente(s) de las observaciones. Puede seleccionar fuentes múltiples. Se seleccionarán todas las observaciones que tengan por lo menos una fuente de observación.

Con estado

De la lista, seleccione el estado de observación de su criterio.

Con ID observación

Introduzca el ID de la observación o serie de IDs de observación para seleccionar la observación (u observaciones).  Por ejemplo, para seleccionar la línea base GPS 8, introduzca LB8.  Introduzca LB8-LB12 para seleccionar todas las observaciones en ese rango.

Tomas aisladas solamente

Cuando esta casilla de verificación está verificada, sólo se seleccionarán tomas aisladas.

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


Diálogo Seleccionar observaciones - Ficha GPS
    Diálogo Seleccionar observaciones − Ficha GPS

Utilice esta ficha para introducir los criterios para la selección de líneas base GPS.

Razón

Seleccione el signo menor que o mayor que. Introduzca el valor de la razón que quiere utilizar en su criterio.

Varianza ref

Seleccione el signo menor que o mayor que. Introduzca la varianza de referencia que quiere utilizar en su criterio.

RMS

Seleccione el signo menor que o mayor que. Introduzca el valor RMS que quiere utilizar en su criterio.

Prec horz

Haga clic en el botón menor o igual que o mayor o igual que para seleccionar el signo a utilizar en su criterio. Introduzca el valor de precisión horizontal que quiere utilizar en el criterio.

Prec vert

Haga clic en el botón menor o igual que o mayor o igual que para seleccionar el signo a utilizar en su criterio. Introduzca el valor de precisión vertical que quiere utilizar en el criterio.

NOTA: Las consultas de Prec horz y Prec vert se basan en valores exactos. Los valores visualizados tales como los de los campos de la ventana Propiedades muestran valores redondeados.

Tipo(s) de solución

De la lista, seleccione el tipo(s) de solución que quiere utilizar en su criterio. Puede seleccionar múltiples tipos de solución.

Método(s) campo

De la lista, seleccione el(os) método(s) de campo GPS que quiere utilizar en su criterio. Puede seleccionar múltiples métodos de campo.

NOTA: Sólo se seleccionan las observaciones que cumplan con los tipos de solución y con los métodos de campo.

Observada entre

Utilice estos campos para especificar un rango de fecha y de hora para los criterios. Se seleccionarán las observaciones con una hora inicial y final dentro de los criterios especificados. El software guardará los valores introducidos para la próxima vez que utilice esta opción.

Observado por más de (seg)

Utilice este campo para seleccionar las líneas base GPS que han sido observadas por más tiempo que el especificado. El campo tiene el formato hh:mm:ss.

NOTA:  Se podrá usar Rellenar campo para especificar el tiempo.

Añadir a selección actual

Si, cuando acceda a este diálogo, ya ha seleccionado una o varias entidades, esta casilla de verificación estará disponible. Si quiere borrar la selección actual antes de aplicar la selección que resulte de este diálogo, inhabilite esta casilla de verificación.


    Comando Por capa

Utilice este comando para seleccionar todas las entidades de las capas especificadas.

Para acceder al mismo:

  Elija Seleccionar / Por capa.

Se abre el diálogo Seleccionar por capas.


    Diálogo Seleccionar por capas

Utilice este diálogo para seleccionar entidades en las capas elegidas.

Para acceder al mismo

  Elija Seleccionar / Por capa.

Capas

La lista de capas muestra los nombres de las capas del proyecto.

Para seleccionar las entidades que aparecen en una capa, seleccione la casilla de verificación al lado del nombre de la capa.

Si la capa tiene la propiedad Bloqueada configurada en habilitada, o la propiedad Visible especificada en inhabilitada, la casilla de verificación de la capa aparece sombreada. Para habilitar la selección de capas, utilice la herramienta Selección de capas o el diálogo Capa para cambiar las propiedades Bloqueada y Visible. Así se habilitará la casilla de selección de la capa.

Todos

Haga clic en Todos para seleccionar todas las capas visualizadas en la lista Capas.

Ninguno

Haga clic en Ninguno para inhabilitar todas las casillas de verificación de las capas que estén en la lista correspondiente.


    Comando Por estilos

Utilice este comando para seleccionar todas las entidades que utilicen estilos concretos.

Para acceder al mismo, elija Seleccionar / Por estilos.

Se abre el diálogo Seleccionar por estilos.


    Diálogo Seleccionar por estilos

Utilice este diálogo para seleccionar todas las entidades CAD (puntos, líneas, arcos, curvas, anotaciones, texto) de la vista del plano que tengan los estilos especificados.

Para acceder al mismo, elija Seleccionar / Por estilos.

Estilos

Seleccione la ficha de un tipo de estilo concreto. Los estilos son los mismos que hay disponibles en el diálogo Estilos CAD. Seleccione un estilo de la lista que aparece. Sólo puede utilizarse una ficha para seleccionar entidades. Si elige uno o más estilos de una ficha, y luego elige otra ficha se perderán las selecciones efectuadas en la ficha anterior.

Para seleccionar tipos múltiples de entidad (por ejemplo, puntos y líneas) utilice este diálogo para hacer una selección, guardar el conjunto de selección, y luego seleccionar otro(s) tipo(s) de entidad. Guarde el conjunto de selección nuevo. Usted puede recuperar ambos conjuntos de selección a la vez utilizando Seleccionar / Conjuntos de selección  / Recuperar.

Use la opción <Por capa> para seleccionar entidades que tengan el campo apropiado especificado en <Por capa>.

Todos

Haga clic en Todos para seleccionar todos los estilos visualizados en el cuadro de lista Estilos.

Ninguno

Haga clic en Ninguno para inhabilitar todas las casillas de verificación del estilo visualizado en el cuadro de lista Estilos.


    Comando Por tipo

Utilice este comando para seleccionar todas las entidades de un tipo concreto.

Para acceder al mismo, elija Seleccionar / Por tipo.

Se abre el diálogo Seleccionar por tipo.


    Diálogo Seleccionar por tipo

Utilice este diálogo para seleccionar las entidades de un tipo concreto.

Para acceder al mismo, elija Seleccionar / Por tipo.

Tipos

Esta lista muestra los nombres de todos los tipos de entidades diferentes (puntos, líneas, curvas, arcos, anotaciones, texto).

Seleccione la casilla de verificación de un tipo concreto para seleccionar entidades de dicho tipo.

Todos

Haga clic en Todos para seleccionar todos los tipos visualizados en el cuadro de lista Tipos.

Ninguno

Haga clic en Ninguno para inhabilitar todas las casillas de verificación de los tipos visualizados en el cuadro de lista Tipos.


Comando Por consulta

Utilice este comando para seleccionar las entidades que coincidan con las condiciones especificadas en consultas.

Para acceder al mismo, elija Seleccionar / Por consulta.

Aparece el diálogo Seleccionar por consulta.


Diálogo Seleccionar por consulta

 Visión de conjunto y más información

Utilice este diálogo para elegir una consulta para las entidades seleccionadas.

Para acceder al mismo, elija Seleccionar / Por consulta.

Consultas

La lista de consultas disponibles incluye todas las consultas personalizadas que usted ha definido en el proyecto además de las siguientes:

Nombre de la consulta	Selecciona …
Todos los eventos	observaciones con registros de evento
Puntos GPS autónomos	puntos que tienen posiciones autónomas. Por ejemplo, puntos en un archivo .dat que no se han procesado.
Líneas base usando receptor …	líneas base que se han observado usando el mismo receptor. Introduzca el valor en el diálogo Introducción parámetro.
Puntos observados convencionalmente	puntos que se han observado usando instrumentos convencionales.
Rango de elevación	puntos que tienen elevaciones dentro del rango especificado. Introduzca valores en el diálogo Introducción parámetro.
Puntos WGS-84 tecleados	puntos que eran puntos WGS-84 tecleados.
Puntos del telémetro de láser	puntos que se han observado usando un telémetro de láser.
Notas	todos los registros de nota en el proyecto. Las notas se pueden añadir en el campo al usar Trimble Survey Controller. Utilice esta opción de selección para seleccionar notas para crear informes personalizados.
Coordenadas nulas	puntos que tienen coordenadas nulas. Esto puede suceder si ha observado a un punto de referencia que no tiene coordenadas.
Elevaciones nulas	puntos que tienen elevaciones nulas.
Puntos por descripción	puntos que tienen un campo de descripción igual que el que se especifica. Introduzca valores en el diálogo Introducción parámetro. Puede emplear caracteres comodines.
Puntos observados varias veces	puntos que han sido observados más de una  vez. Esta consulta emplea todos los tipos de observación. Para observaciones terrestres, la consulta utiliza configuraciones de destino. Para ocupaciones RTK, usa ocupaciones GPS para el punto. Para ocupaciones estáticas y estáticas rápidas, emplea las ocupaciones donde el punto es el punto "al" de las observaciones. La consulta luego suma todo lo anterior y selecciona los puntos cuyo total es de más de uno.
Puntos con distintos nombres dentro de la distancia	puntos que tienen distintos nombres y están dentro de la distancia especificada. Introduzca valores en el diálogo Introducción parámetro.
Puntos sin nombres	puntos que no tienen nombres.
Vectores RTK con covarianzas (QC2)	vectores RTK que tienen registros QC2. Dichos puntos se pueden utilizar en un Ajuste de la red (si tiene el módulo Network Adjustment instalado.)
Líneas base sin procesar	líneas base que pueden ser procesadas pero que no lo han sido.

Las consultas seleccionan entidades en función de la definición de la consulta y la descripción de la consulta se muestra en la barra de estado.

Por ejemplo, usted puede seleccionar puntos que tengan un rango de elevaciones concreto.

Cuando las consultas requieran parámetros, el nombre va seguido por puntos suspensivos. Si se elige tal consulta, se le pedirá que proporcione los valores de los parámetros.

Selección

En el grupo Selección, podrá realizar tres operaciones de selección:

  Nuevo − crea un nuevo conjunto de selección

  Añadir a actual − añade el conjunto de selección que está por crear al conjunto de selección actual

  Refinar actual − encuentra puntos que son comunes con el conjunto de selección que está por crear, usando el conjunto de selección actual.

Por ejemplo, si tiene un proyecto en el que desea encontrar todas las líneas base sin procesar observadas usando un receptor GPS con el número de serie 1234, haga lo siguiente:

1.	Use la consulta para seleccionar todas las líneas base sin procesar.

2.	Vuelva a usar la consulta para seleccionar la opción Líneas base utilizando receptor.

3.	En el grupo Selección, seleccione la opción Refinar actual.

4.	Introduzca el número de serie del receptor (1234) en el diálogo Seleccionar por consulta − Parámetros.

Se seleccionarán las líneas base sin procesar que se han observado al seleccionar el receptor 1234.


Comando Por característica de punto

Utilice este comando para seleccionar puntos que tengan códigos de característica con atributos que coincidan con los nombres especificados.

Para acceder al mismo, elija Seleccionar / Por característica de punto.

Aparece el diálogo Seleccionar por característica de punto.


Diálogo Seleccionar por característica de punto

Utilice este comando para seleccionar puntos que tengan características y su información de atributo correspondiente. Para ver las características y los atributos de un punto, utilice la ventana Propiedades − Ficha Atributos.

Características

La lista de características muestra todas las características con definiciones de atributo que existen en el archivo de biblioteca de características y atributos (*.fcl) o en el archivo de diccionario de datos (*.ddf) que utilizó para configurar el proyecto con atributos.

Seleccione las casillas de verificación para las características. Se seleccionarán todos los puntos que tengan por lo menos una de las características especificadas.

Todos

Para seleccionar todas las casillas de verificación, haga clic en Todos.

Ninguno

Para inhabilitar todas las casillas de verificación, haga clic en Ninguno.


Conjuntos de selección - Visión de conjunto
Conjuntos de selección − Visión de conjunto

Más información

 Cómo ...

Visión de conjunto

Un conjunto de selección puede ser cualquier cosa que se haya seleccionado actualmente en Trimble Geomatics Office. Usted puede guardar el conjunto de selección actual en cualquier momento y recuperarlo más tarde. Por ejemplo, puede registrar un conjunto de selección de todos los puntos de control del proyecto y generar informes sobre los mismos al recuperar dicho conjunto. Estos conjuntos de selección guardados mantienen el orden de las entidades que contienen. Si usted elimina varias entidades de un conjunto de selección, éste último sigue funcionando con las entidades que queden.

NOTA: Los conjuntos de selección se podrán mostrar usando la opción Mostrar sólo datos en el conjunto de selección en el diálogo Filtros de vista.

Cuando importe un archivo, Trimble Geomatics Office automáticamente genera un conjunto de selección con nombre. Este conjunto registra el orden en que se capturaron los datos. Esto es importante para tareas tales como la codificación de características. En el caso de los archivos de Survey Controller (*.dc), Trimble Geomatics Office nombra el nuevo conjunto de selección con el identificador del trabajo que usted importa. En el caso de otros archivos, como los archivos ASCII, Trimble Geomatics Office nombra el nuevo conjunto de selección con el nombre del archivo.

NOTA: Si importa datos RTK dentro de los que se ha perdido la inicialización dentro de los primeros 15 minutos, durante la importación se creará un conjunto de selección RMS alto.


Conjuntos de selección - Comando Guardar
Conjuntos de selección − Comando Guardar

Utilice este comando para guardar el conjunto de selección actual.

Para acceder al mismo:

  Elija Seleccionar / Conjuntos de selección  / Guardar.

Aparece el diálogo Guardar.

Este comando no está disponible si no se ha seleccionado nada.


Conjuntos de selección - Diálogo Guardar
Conjuntos de selección − Diálogo Guardar

 Visión de conjunto y más información

Utilice este diálogo para guardar el conjunto de selección actual.

Para acceder al mismo, elija Seleccionar / Conjuntos de selección  / Guardar.

Nombre

Introduzca un nombre único para el conjunto de selección.

Aceptar

Haga clic en Aceptar para crear el conjunto de selección.

Cuando se vuelva a abrir, el conjunto de selección aparece en el diálogo Recuperar. El conjunto de selección nuevo se añade a la lista de conjuntos de selección recientemente utilizados. Para abrir el diálogo Recuperar y ver esta lista, elija Seleccionar / Conjuntos de selección .


Conjuntos de selección - Comando Recuperar
Conjuntos de selección − Comando Recuperar

Utilice este comando para recuperar un conjunto de selección . Este comando no está disponible si no hay ningún conjunto de selección para recuperar.

Para acceder al mismo:

  Elija Seleccionar / Conjuntos de selección  / Recuperar.

Aparece el diálogo Conjuntos de selección  − Recuperar.


Conjuntos de selección - Diálogo Recuperar
Conjuntos de selección − Diálogo Recuperar

 Visión de conjunto y más información

Utilice este diálogo para recuperar uno o varios conjuntos de selección de una vez. Por ejemplo, si ha guardado dos conjuntos de selección, utilice este diálogo para seleccionar todas las entidades de ambos conjuntos de selección.

Para acceder al mismo, elija Seleccionar / Conjuntos de selección / Recuperar.

Conjuntos de selección

Esta lista contiene todos los conjuntos de selección guardados para el proyecto.

Todos

Haga clic en Todos para seleccionar todos los conjuntos de selección.

Ninguno

Haga clic en Ninguno para borrar las casillas de verificación de todos los conjuntos de selección.


Conjuntos de selección - Comando Editar
Conjuntos de selección − Comando Editar

Utilice este comando para editar la información de los conjuntos de selección guardados. Este comando no está disponible si no hay ningún conjunto de selección para editar.

Para acceder al mismo, elija Seleccionar / Conjuntos de selección  / Editar.

Aparece el diálogo Editar.


Conjuntos de selección - Diálogo Editar
Conjuntos de selección − Diálogo Editar

 Visión de conjunto y más información

Utilice este diálogo para renombrar o eliminar conjuntos de selección guardados.

Conjuntos de selección

Resalte el conjunto de selección que quiere editar o eliminar.

Renombrar

Haga clic en Renombrar para renombrar el conjunto de selección resaltado.

Eliminar

Haga clic en Eliminar para eliminar el conjunto de selección resaltado.


Conjuntos de selección - Diálogo Renombrar
Conjuntos de selección − Diálogo Renombrar

 Visión de conjunto y más información

Utilice este diálogo para renombrar el conjunto de selección resaltado.

Para tener acceso al mismo:

1.	Elija Seleccionar / Conjuntos de selección / Editar. Aparecerá el diálogo Editar.

2.	Haga clic en Renombrar. Aparecerá el diálogo Renombrar.

Nombre

Introduzca un nombre único para el conjunto de selección.

Aceptar

Haga clic en Aceptar para aplicar los cambios.

El conjunto de selección aparece en el diálogo Editar. El nuevo conjunto de selección aparece en la lista de conjuntos de selección recientemente utilizados.


Selección de entidades - Visión de conjunto
Selección de entidades − Visión de conjunto

A veces sólo se necesita realizar una acción en un subconjunto del proyecto (por ejemplo, el procesamiento de códigos de característica). Usted puede seleccionar entidades (puntos, líneas, arcos, curvas, texto, anotaciones, observaciones) en el proyecto de dos maneras:

  Utilizando el ratón.

  Utilizando el menú Seleccionar.

Utilización del ratón en la selección de entidades

Para seleccionar una entidad, haga clic en la misma con el ratón (Para seleccionar entidades múltiples, mantenga presionada Mayús simultáneamente)

Entonces usted puede realizar las tareas requeridas en las entidades seleccionadas.

Para hacer una selección inversa, presione Ctrl. Todas las entidades seleccionadas se deseleccionan y viceversa.

Nota: El ratón se podrá utilizar para ver las entidades en la ventana Propiedades sin tener que volver a seleccionarlas continuamente. Presione y mantenga presionado el botón del ratón sobre un punto por algunos segundos, luego arrastre el puntero sobre las entidades que desea ver.

Utilización del menú Seleccionar en la selección de entidades

El menú Seleccionar contiene muchos métodos diferentes para seleccionar puntos. Las opciones del menú Seleccionar dependen de la vista en que se encuentre: la vista del levantamiento o la vista del plano.


Comando Puntos duplicados - Por coordenadas
Comando Puntos duplicados − Por coordenadas

Utilice este comando para seleccionar puntos que tengan coordenadas idénticas.

Para acceder al mismo, elija Seleccionar / Puntos duplicados / Por coordenadas.


Comando Puntos duplicados - Por nombre
Comando Puntos duplicados − Por nombre

Utilice este comando para seleccionar puntos que tengan el mismo nombre.

Para acceder al mismo:

  Elija Seleccionar / Puntos duplicados / Por nombres.

SUGERENCIA: Use este comando antes de mezclar puntos duplicados.


Comando Puntos duplicados - Por nombre y distancia
Comando Puntos duplicados − Por nombre y distancia

Utilice este comando para seleccionar puntos que tengan el mismo nombre y que se encuentren en la distancia especificada. Introduzca valores en el diálogo Introducción de parámetros.

Para acceder al mismo:

  Elija Seleccionar / Puntos duplicados / Por nombre y distancia.


Diálogo Seleccionar puntos replanteados

Use este diálogo para seleccionar puntos replanteados utilizando una serie de consultas. Estas herramientas de selección se pueden emplear con los informes adicionales y las opciones para exportar personalizadas.

Para acceder al mismo, elija Seleccionar / Puntos replanteados.

Consultas

La lista de consultas disponibles incluye las consultas personalizadas que se han definido en el proyecto así como también las siguientes:

Nombre de la consulta	Selecciona …	Introduzca esta información en el diálogo Introducción parámetro …
Todos los puntos replanteados	todos los puntos que se han replanteado en el campo.
Puntos del arco	los puntos que tienen referencia a un arco. Por ejemplo, los puntos que han sido replanteados en o desde un arco.	nombre del arco
Puntos MDT	Los puntos que tienen referencia a un MDT. Por ejemplo, los puntos que tienen referencia a un MDT. Por ejemplo, los puntos que han sido replanteados en o de un MDT.	nombre MDT
Puntos línea	Los puntos que hacen referencia a una línea. Por ejemplo, los puntos que se han replanteado en, de o a una línea.	nombre línea
Puntos de diseño	Los puntos que hacen referencia a un punto de diseño. Por ejemplo, los puntos que se han replanteado de, a o en un punto de diseño.	nombre del punto de diseño
Puntos ctra	Los puntos que tienen referencia a un punto de la carretera. Por ejemplo, los puntos que se han replanteado de, en o a una carretera.	nombre carretera
Puntos de captura para una carretera	Puntos de captura para una carretera.	nombre carretera
Puntos en una carretera con característica	Puntos en una carretera con una característica.	Nombre carretera y característica
Todos los puntos con errores de replanteo mayores de	Puntos con errores de replanteo mayores que el error horizontal y vertical especificado en el diálogo Introducción parámetros.

En aquellos casos en que una consulta necesita parámetros, el nombre estará seguido de puntos suspensivos. Si elige una de dichas consultas, se le pedirá proveer los valores de parámetros.

Selección

En el grupo Selección, podrá realizar tres operaciones de selección:

  Nuevo − crea un nuevo conjunto de selección

  Añadir a actual − añade el conjunto de selección que está por crear al conjunto de selección actual

  Refinar actual − usando el conjunto de selección actual, encuentra puntos que son comunes con el conjunto de selección que está por crear.

Por ejemplo, tal vez tenga un proyecto en el que desea encontrar todas las líneas base sin procesar que se han observado usando un receptor GPS con el número de serie 1234.  Para hacerlo:

1.	Use la consulta para seleccionar todas las líneas base sin procesar.

2.	Vuelva a usar la consulta para seleccionar la opción Líneas base utilizando receptor. En el grupo Selección, seleccione la opción Refinar actual. Introduzca el número de serie del receptor (1234) en el diálogo Seleccionar por consulta − Parámetros.

Se seleccionarán las líneas base sin procesar que se han observado al seleccionar el receptor 1234.


Seleccionar puntos de calibración

Use esta opción para seleccionar los puntos de calibración que aparecen en Calibración local GPS − Lista de puntos en el proyecto de Trimble Geomatics Office.

Para acceder a la misma, elija Seleccionar / Puntos de calibración.

Todos los puntos de calibración que aparecen en Calibración local GPS − Lista de puntos estarán seleccionados en el proyecto.

NOTA: Si no hay puntos en la lista Puntos de calibración, la opción no estará disponible.


Asistencia técnica

Si tiene algún problema y no puede encontrar la información que necesita en la documentación del producto, contacte a su distribuidor local. Alternativamente, solicite soporte técnico usando el sitio de Trimble en la World Wide Web (http://www.trimble.com/support/support.htm).


Barras de herramientas - Visión de conjunto

Una barra de herramientas está formada por varias herramientas. Las barras están separadas por líneas verticales en la ventana gráfica de Trimble Geomatics Office. Una herramienta es un acceso directo a los comandos del menú frecuentemente utilizados.

Para ver una descripción de la herramienta, posicione el puntero del ratón sobre la herramienta y vea:

  sugerencias sobre la herramienta

  la barra de estado

Para cambiar el orden en el posicionamiento de las barras de herramientas en la ventana de Trimble Geomatics Office, arrastre la barra de herramientas utilizando la línea vertical que separa la barra de herramientas de los otros elementos de la ventana.

Las siguientes barras de herramientas están disponibles en la vista del levantamiento y en la vista del plano:

  Estándar

  Vistas

  Controles vista

Las siguientes barras de herramientas sólo están disponibles en la vista del levantamiento:

  Filtros

  Timeline (Línea de tiempo) (si tiene instalado el módulo Baseline Processing [Procesamiento de líneas base])

  Dibujos de Timeline (si tiene instalado el módulo Baseline Processing)

  Controles de elipses (si tiene instalado el módulo Network Adjustment [Ajuste de la red])

Las siguientes barras de herramientas sólo están disponibles en la vista del plano:

   Capas

   CAD


 Barra de herramientas CAD

La barra de herramientas CAD proporciona un acceso rápido a las características comunes del menú Insertar:

Esta herramienta …	abre el siguiente diálogo …	Úsela para añadir estos elementos a la base de datos …
	Insertar puntos	registros de punto
	Insertar puntos por acimut y distancia	registros de punto
	Insertar línea	registros de línea
	Insertar línea	registros de curva
	Insertar línea	registros de arco
	Insertar texto	registros de texto


Barra de herramientas Estándar

Esta barra proporciona el acceso rápido a varias de las opciones principales disponibles en los menús Archivo y Editar.

Herramienta	Selecciónela para …
	crear un nuevo proyecto
	abrir un proyecto existente
	importar datos de un archivo, de un dispositivo o receptor GPS
	exportar datos a un archivo, a un dispositivo o receptor GSP
	cortar la selección y ponerla en el portapapeles
	copiar la selección y ponerla en el portapapeles
	pegar el contenido del portapapeles
	deshacer la última acción
	rehacer la última acción que se ha deshecho
	abrir la ventana Propiedades y ver o editar las propiedades de la selección actual.


Herramienta Editar capas

Seleccione [image]  para mostrar el diálogo Capas. Use este diálogo para administrar capas.


  Herramienta Selección de capas

La capa visualizada es la capa actual. Para cambiarla, haga clic en la flecha y seleccione la capa de la lista desplegable.

El icono de la bombilla indica si la capa es visible o no. Para cambiar la visibilidad de cualquier capa, haga clic en la bombilla de la capa apropiada.

Es icono de la bombilla se aclara. Para visualizar la capa, haga clic en el icono de la bombilla otra vez. Si hay una o más capas con la propiedad Visible inhabilitada, se muestra un icono de bombilla en la barra de estado.

El icono del candado indica si la capa está o no bloqueada. Si la propiedad de bloqueo está habilitada, no se podrá seleccionar ninguna entidad de la capa, incluso si pueden verse en la ventana gráfica.

Para cambiar la propiedad de bloqueo de cualquier capa, haga clic en el icono del candado de la capa apropiada. Para que la capa pueda seleccionarse, haga clic en el icono de nuevo. Si hay una o más capas con la propiedad de bloqueo habilitada, se muestra un icono de candado en la barra de estado.

NOTA: Estas propiedades también pueden cambiarse utilizando el diálogo Capas.


Barra de herramientas Controles vista

Esta barra de herramientas proporciona herramientas de navegación que facilitan la visualización en la ventana gráfica.

Los botones siguientes funcionan en modalidad permanente. Esto significa que el cursor continúa siendo la herramienta seleccionada hasta que se seleccione otra herramienta haciendo clic en otro botón:

Herramienta	Selecciónela para …
	cambiar a la modalidad de selección
	cambiar el centro de la vista del área de zoom
	hacer un zoom para acercar con un factor de 2
	hacer un zoom para alejar con un factor de 2

Las siguientes herramientas no son permanentes. Realizan una operación determinada cada vez que se las selecciona:

Herramienta	Selecciónela para …
	efectuar un alcance de zoom en el modelo.
	efectuar un zoom en las configuraciones anteriores.
	conmutar la barra de proyectos
	mostrar las líneas de cuadrícula en la ventana gráfica. (También podrá elegir esta configuración en el diálogo Opciones vista.)


Barra de herramientas Vistas

Utilice las herramientas en esta barra para hacer lo siguiente:

Esta herramienta …	Cambia a esta vista …
	Levantamiento
	Plano


 Barra de herramientas Filtros

Esta barra de herramientas está disponible en la vista del levantamiento. Contiene la herramienta Filtros de vista y Timeline.

Herramienta	Selecciónela para …
	determinar las observaciones que se van a mostrar o cómo aparecerán en la vista del levantamiento.
	abrir la ventana Timeline
	Vincular las observaciones en la ventana gráfica y Timeline. Cuando se selecciona esta herramienta, el software sólo muestra las líneas base con posprocesamiento dentro de la vista actual de Timeline y las líneas base con posprocesamiento que se han observado al mismo tiempo. Se ocultarán todas las otras líneas base con posprocesamiento en la vista del levantamiento. Esta es una herramienta útil para seleccionar líneas base independientes.


    Barra de herramientas Capas

Esta barra de herramientas está disponible en la vista del plano. Contiene las herramientas Editar capas y Selección de capas. Use esta barra de herramientas para administrar capas.


    Comando Procesar códigos característica

Utilice este comando para procesar códigos de característica.

Para acceder al mismo, seleccione Herramientas / Procesar códigos característica.

Aparece el diálogo Procesar códigos característica.


    Diálogo Procesar códigos característica

 Visión de conjunto

Utilice este diálogo para procesar códigos de característica.

Para acceder al mismo, seleccione Herramientas / Procesar códigos característica.

Biblioteca de caract. y atributos

Seleccione la biblioteca de características y atributos con la que quiere procesar los datos.

Examinar

Haga clic en Examinar para ubicar la biblioteca de características y atributos.

NOTA: En Trimble Geomatics Office todas las bibliotecas de características y atributos son archivos del tipo .fcl. Si selecciona una biblioteca de características y atributos  de los sistemas TRIMMAP o SDRmap, la biblioteca de características y atributos automáticamente se convierte en un archivo .fcl.

Por ejemplo, si selecciona un archivo ‘Fclib??.dat’ (que es el modelo de nombre de archivo de la biblioteca de códigos de característica de los sistemas TRIMMAP y SDRmap), cuando procese la biblioteca, Trimble Geomatics Office le preguntará que si quiere convertirla. Asimismo el sistema le pide que proporcione un nombre con el que guardar la biblioteca. El nombre por defecto sugerido sigue el modelo Fclib??.fcl y por defecto se almacena en la carpeta del sistema.

Si Trimble Geomatics Office se encuentra con alguna definición de código que no puede convertir, le avisa que la biblioteca resultante necesita ser editada. Si aparece cualquier error, el sistema genera un informe.

Procesar

Los códigos de característica se procesan en el orden en que se han seleccionado.

Elija la opción Selección actual para procesar las entidades actualmente seleccionadas.

Elija la opción Conjunto de selección y escoja un conjunto de selección para procesar de la lista.

La opción Selección actual no está habilitada si no está disponible ningún conjunto de selección.

Aceptar

Haga clic en Aceptar para procesar los códigos de característica.

Se procesa la biblioteca y los resultados de la codificación de características aparecen en la ventana gráfica. Si se produce algún error durante el procesamiento, se puede ver un informe de errores. Para ver dónde se han producido los mismos, abra el informe. Este se guarda en la carpeta Informes del proyecto para que pueda verse más adelante.


Trimble RoadLink - Visión de conjunto
Trimble RoadLink − Visión de conjunto

Trimble RoadLink™ es una utilidad de Trimble Geomatics Office. Es una potente interfaz entre las definiciones viales de otros proveedores y dispositivos topográficos de Trimble.

Utilícelo para:

  introducir datos

  ver datos gráficamente

  editar datos

Luego podrá transferir la definición vial a dispositivos topográficos de Trimble para usarla durante el replanteo.

RoadLink proporciona dos maneras de transferir definiciones viales:

  conversión automática de archivos (de alineación horizontal y vertical y de sección transversal) proporcionados por otros softwares de diseño.

  introducción manual de la definición vial, incluyendo alineaciones horizontal y vertical, plantillas, y peralte.

Como componente integral de Trimble Geomatics Office, RoadLink también calcula los volúmenes de desmonte y terraplén para movimientos de tierra entre la definición vial y un modelo de superficie definido en la utilidad DTMLink de Trimble.


Trimble DTMLink - Visión de conjunto
Trimble DTMLink − Visión de conjunto

Trimble DTMLink™ es una utilidad de Trimble Geomatics Office. Esta utilidad genera superficies digitales del terreno. Con ella usted puede importar superficies definidas por software de terceros, crear superficies nuevas y editar las ya existentes. Asimismo puede transferir las superficies a un dispositivo topográfico de Trimble para replanteo en el campo.

El software tiene la capacidad de incluir límites y líneas de ruptura en el modelo de superficie de curvas de nivel, y permite características de edición de triángulos avanzada para ofrecer un mayor control sobre la formación del modelo.

A partir de dicho modelo de superficie se crea un modelo digital cuadriculado del terreno (MDT) para su exportación a un dispositivo o un archivo de datos.

El modelo que se crea también puede ser utilizado por Trimble RoadLink para calcular volúmenes de tierra.

Trimble DTMLink le permite crear informes de volumen.

Algunas aplicaciones generales para las que se realizan cálculos de volumen son:

  cálculos de reservas (acopios)

  volúmenes de capas de materiales, tales como vetas de carbón

  volúmenes de hueco tales como los de los lagos creados como consecuencia de la construcción de presas

DTMLink utiliza el método de cálculo de volúmenes de prismas triangulares individuales. Estos quedan definidos por los planos triangulares que forman el modelo de superficie de curvas de nivel al utilizar las áreas de la base y las alturas medias de los prismas.

DTMLink le permite crear superficies de comparación. Estas son modelos de superficies que representan las diferencias entre dos superficies. Usted puede utilizarlas junto con el tipo de cálculo del volumen ‘Sobre una elevación’ para calcular los volúmenes de desmonte y de terraplén entre ambas superficies.


    Comando Inicio

Este comando inicia la utilidad DTMLink.

Para acceder al mismo:

  Seleccione Herramientas / DTMLink / Inicio.

Utilice este comando para que DTMLink inicie la importación de archivos AutoCAD DXF de caras 3D sin crear una superficie nueva ni abrir una ya existente.

Para ello:

1.	Seleccione Herramientas / DTMLink / Inicio.

2.	Seleccione Archivo / Importar.

Para obtener más información, véase la ayuda de DTMLink.


    Comando Nueva superficie

Utilice este comando para crear un nuevo modelo de superficie.

Para acceder al mismo, seleccione Herramientas / DTMLink / Nueva superficie.

Aparece el diálogo Nueva superficie.


    Diálogo Nueva superficie

Utilice este diálogo para crear un nuevo modelo de superficie.

Para acceder al mismo, seleccione Herramientas / DTMLink / Nueva superficie.

Nombre

Introduzca un nombre apropiado para la nueva superficie.

Puntos

Las opciones de Puntos le permiten seleccionar los puntos de la base de datos del proyecto que debe utilizar para la formación de la superficie.

  si no hay una selección actual de la base de datos, la opción Selección actual no está disponible.

 si no hay una selección actual, la opción Selección actual utiliza los puntos de la selección actual para formar la superficie.

La opción Toda base datos utiliza todos los puntos de la base de datos para la formación de la superficie.

La opción Conjunto de selección le permite elegir un conjunto de selección existente, donde se guardan los puntos que quiere utilizar para formar la superficie.

Usar L.ruptura

Las opciones de Usar L.ruptura le permiten seleccionar líneas de la base de datos a utilizar como líneas de ruptura en la formación de la superficie.

En términos de formación de modelos de superficie, se considera que las líneas de ruptura tienen una pendiente constante por lo que facilitan el control de la formación del modelo.

Estas opciones sólo están disponibles si se selecciona la opción Líneas de ruptura. Para que toda la información de líneas de ruptura se pase a la formación del modelo de superficie, debe seleccionarse la casilla de verificación Usar L.ruptura.

La opción Conjunto de selección le permite utilizar las líneas de un conjunto de selección existente como las líneas de ruptura durante la formación de la superficie. La opción Capa le permite usar las líneas de una capa existente como las líneas de ruptura durante la formación de la superficie. En ambos casos la lista asociada proporciona listas de los conjuntos de selección o capas disponibles.

Usar límites de exclusión

Las opciones de Usar límites de exclusión funcionan de forma parecida a las de Usar L.ruptura anteriormente descritas. Estas opciones le permiten especificar que las líneas existentes en un conjunto de selección o en una capa se utilicen para la definición de uno o varios límites de exclusión durante la formación del modelo de la superficie.

Un límite de exclusión es un conjunto de líneas que definen una figura cerrada en cuyo interior no pueden formarse triángulos de la superficie. Si las líneas especificadas para la definición del límite de exclusión no logran formar figuras totalmente cerradas, el proceso de formación del modelo de superficie añade las líneas de cierre por defecto.

Usar límites de inclusión

Las opciones de Usar límites de inclusión funcionan de forma parecida a las de Usar límites de exclusión anteriormente descritas. Estas opciones le permiten especificar que las líneas existentes en un conjunto de selección o en una capa se utilicen para la definición de uno o varios límites de inclusión durante la formación del modelo de la superficie.

Un límite de inclusión es un conjunto de líneas que definen una figura cerrada en cuyo interior se forman triángulos de la superficie. No se forma ningún triángulo fuera de los límites de inclusión definidos. Si las líneas especificadas para la definición del límite de inclusión no logran formar figuras totalmente cerradas, el proceso de formación del modelo de superficie añade líneas de cierre por defecto.

NOTA: Las líneas utilizadas como líneas de ruptura, límites de exclusión, y límites de inclusión pueden incluir arcos y curvas. En estos casos, DTMLink interpreta los arcos o curvas como una serie de segmentos cortos de líneas rectas que se utilizan en la formación de triángulos. El software se asegura de que ninguno de estos segmentos de línea se separe más de dos centímetros de la línea del arco o curva.

Para obtener más información sobre límites y líneas de ruptura, véase la ayuda en pantalla de Trimble DTMLink.


    Comando Superficie existente

Utilice este comando para editar el modelo de una superficie existente.

Para acceder al mismo, seleccione Herramientas / DTMLink / Superficie existente.

Aparece el diálogo Superficie existente.


    Diálogo Superficie existente

Utilice este diálogo para editar el modelo de una superficie existente. Este diálogo le permite especificar puntos y líneas del proyecto que quiera añadir a la superficie existente.

Para acceder al mismo, seleccione Herramientas / DTMLink / Superficie existente.

NOTA: Si en este diálogo se especifican puntos y líneas que ya forman parte de la superficie existente, el sistema se dará cuenta y no los añadirá a la superficie por segunda vez.

Nombre

Este campo presenta una lista de las superficies del proyecto existentes. Seleccione la superficie que quiere cargar y editar.

Añadir puntos

Seleccione los puntos de la base de datos del proyecto que quiere añadir a la superficie existente.

Si no hay una selección de base de datos existente, la opción Selección actual no está disponible.

Cuando hay una selección actual, la opción Selección actual añade los puntos de la selección actual a la superficie existente.

La opción Toda base datos pasa todos los puntos de la base de datos actual al modelo de superficie. Esto le permite añadir automáticamente todos los puntos nuevos de la base de datos al modelo.

La opción Conjunto de selección le permite elegir un conjunto de selección existente que guarda los puntos que quiere añadir a la superficie existente.

Añadir L.ruptura

Las opciones de Añadir L.ruptura le permiten seleccionar líneas de la base de datos a añadir a las líneas de ruptura ya existentes en la superficie. Estas opciones sólo están disponibles si se selecciona la opción Añadir L.ruptura.

Para que toda la información de líneas de ruptura se pase al modelo de superficie existente, debe seleccionarse la casilla de verificación Añadir L.ruptura. En términos de formación de modelos de superficie, se considera que las líneas de ruptura tienen una pendiente constante por lo que facilitan el control de la formación del modelo.

La opción Conjunto de selección le permite añadir las líneas de un conjunto de selección existente a las líneas de ruptura de la superficie existente. La opción Capa le permite añadir las líneas de una capa existente a las líneas de ruptura de la superficie existente.

En ambos casos las listas muestran los conjuntos de selección o capas disponibles.

Añadir límites de exclusión

Las opciones de Añadir límites de exclusión funcionan de forma parecida a las de Añadir L.ruptura anteriormente descritas.

Estas opciones le permiten especificar que las líneas existentes en un conjunto de selección o en una capa se añadan como límites de exclusión a la definición de los límites de exclusión de la superficie existente.

Un límite de exclusión es un conjunto de líneas que definen una figura cerrada en cuyo interior no se forman triángulos de la superficie. Si las líneas especificadas para la definición del límite de exclusión no logran formar figuras totalmente cerradas, el proceso de formación del modelo de superficie añade las líneas de cierre por defecto.

Añadir límites de inclusión

Las opciones de Añadir límites de inclusión funcionan de forma parecida a las de Añadir límites de exclusión anteriormente descritas.

Estas opciones le permiten especificar que las líneas existentes en un conjunto de selección o en una capa se añadan como límites de inclusión a la definición de los límites de inclusión de la superficie existente.

Un límite de inclusión es un conjunto de líneas que definen una figura cerrada en cuyo interior se forman triángulos de la superficie.

Si las líneas especificadas para la definición del límite de inclusión no logran formar figuras totalmente cerradas, el proceso de formación del modelo de superficie añade las líneas de cierre por defecto.

NOTA: Las líneas utilizadas como líneas de ruptura, límites de exclusión, y límites de inclusión pueden incluir arcos y curvas. En estos casos, DTMLink interpreta los arcos o curvas como una serie de segmentos cortos de líneas rectas que se utilizan en la formación de triángulos. El software se asegura de que ninguno de estos segmentos de línea se separe más de dos centímetros de la línea del arco o curva.

Para obtener más información sobre límites y líneas de ruptura, véase la ayuda en pantalla de DTMLink.


    Comando Inicio

Este comando inicia la utilidad RoadLink de Trimble. Use este software para importar o introducir manualmente definiciones viales a transferir a dispositivos topográficos de Trimble para el replanteo.

Para acceder al mismo:

  Seleccione Herramientas / RoadLink / Inicio.


    Comando Exportar

Utilice este comando para exportar puntos de un conjunto de selección, de toda la base de datos, o de la selección actual a RoadLink.

Para acceder al mismo:

  Seleccione Herramientas / RoadLink / Exportar.

Aparece el diálogo Exportar.


    Diálogo Exportar

Utilice este comando para exportar puntos de un conjunto de selección, de toda la base de datos, o de la selección actual a RoadLink. La visualización de puntos existentes en la base de datos de RoadLink puede ser útil al introducir o verificar una definición vial.

Para acceder al mismo:

  Seleccione Herramientas / RoadLink / Exportar.

Puntos

Seleccione el conjunto de puntos.

Hay tres opciones disponibles:

Selección actual	Exporta los puntos seleccionados
Toda base datos	Exporta todos los puntos de la base de datos
Conjunto de selección	Elige el conjunto de selección de la lista.
Para obtener más información, véase la ayuda de RoadLink.


Marcas comerciales

El logo del Globo terráqueo y el Triángulo, Trimble, DTMLink, GPSurvey, RoadLink, Trimble Geomatics Office, Trimble Survey Controller, Trimble Survey Office, Trimble Total Control, TRIMMAP, TRIMNET, TSC1, y TSCe son marcas comerciales de Trimble Navigation Limited.

Trimble con el logo del Sextante, Geodimeter, y GPS Pathfinder, son marcas comerciales de Trimble Navigation Limited, registradas en la oficina de Patentes y Marcas Comerciales de los Estados Unidos.

Todas las otras marcas son propiedad de sus respectivos titulares.

Standard Template Library, © 1994 Hewlett-Packard Company, Standard Template Library, © 1996,97 Silicon Graphics Computer Systems, Inc., Standard Template Library, © 1997 Moscow Center for SPARC Technology.


Comandos Comprimir & reparar proyecto

Use este comando para comprimir y reparar la base de datos del proyecto.

Para tener acceso al mismo:

  Seleccione Utilidades / Comprimir & reparar proyecto.

Se abrirá el diálogo Comprimir & reparar proyecto.


Diálogo Comprimir & reparar proyecto

Use este diálogo para comprimir y reparar la base de datos del proyecto.

Comprimir

La compresión ahorra espacio en el disco y ayuda a que el software funcione mejor. Una buena práctica consiste en comprimir regularmente de la base de datos del proyecto.

Reparar

La base de datos puede dañarse, si, por ejemplo, se produce una interrupción de la fuente de alimentación principal cuando se ejecuta Trimble Geomatics Office.

Si usted edita la base de datos y Trimble Geomatics Office se cierra inesperadamente, es probable que, una vez reparada la base de datos, se pierda la última modificación a los datos efectuada en el proyecto.

Tendrá que volver a abrir el proyecto para regresar al punto donde estaba editando, y comprobar si se han guardado los cambios.

Para utilizar el diálogo Comprimir & reparar proyecto:

1.	Seleccione Utilidades / Comprimir & reparar proyecto.

2.	Seleccione el proyecto que quiere comprimir y reparar.

Si la base de datos del proyecto no puede comprimirse o repararse se mostrará un mensaje de error.

SUGERENCIA: Si el disco duro de su computadora está muy fragmentado, desfragméntelo antes de comprimir la base de datos.


Utilidades de Trimble Geomatics Office

Con la opción de instalación Típica de Trimble Geomatics Office están disponibles las siguientes utilidades:

Utilidad Trimble Coordinate System Manager™ (Administrador de sistemas de coordenadas de Trimble)

Utilidad Trimble Convert to RINEX™ (Conversión a RINEX de Trimble)

Utilidad Trimble Data Transfer (Transferencia de datos de Trimble)

Utilidad Trimble DC File Editor™ (Editor de archivos DC de Trimble)

Utilidad Trimble Feature and Attribute Editor™ (Editor de características y atributos de Trimble)

Utilidad Trimble Line Type Editor™ (Editor de tipos de línea de Trimble)

Utilidad Trimble Symbol Editor™ (Editor de símbolos de Trimble)

Utilidad Trimble A1 Viewer

Utilidad QuickPlan™(Planning)

NOTA: La utilidad Trimble Grid Factory™ está disponible desde la opción de instalación personalizada.

Para obtener más información, véase el Manual de Trimble Geomatics Office.

Adición de utilidades

Para añadir utilidades adicionales al menú Utilidades:

1.	Use Explorador de Microsoft Windows para localizar ...\Archivos del programa\Trimble\Trimble Geomatics Office\Utilidad.

2.	Haga clic en el botón derecho del ratón en una zona vacía en la ventana derecha del Explorador.

3.	Seleccione la opción Nuevo / Acceso directo.

Así se abre el asistente de Crear acceso directo.

4.	Para configurar un método de acceso directo, introduzca la ruta de acceso de la utilidad que desea añadir al menú de utilidades.

5.	Haga clic en Siguiente y complete el campo ‘Seleccione un nombre para el acceso directo’ para definir el nombre de la utilidad que quiere que se muestre en el menú Utilidades.

La próxima vez que ejecute Trimble Geomatics Office, la utilidad para la que ha añadido un método abreviado, aparecerá en el menú Utilidades.


Symbol Editor

La utilidad Trimble Symbol Editor™ le permite editar bibliotecas de símbolos de punto (*.sym) utilizadas por Trimble Geomatics Office.

Para tener acceso a la misma, haga uno de los siguientes pasos:

  Seleccione Utilidades / Symbol Editor cuando no haya un proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Para crear o modificar símbolos de puntos existentes, use esta utilidad. Una vez que registre el archivo editado como el archivo del sistema, los símbolos que cree son los que están disponibles cuando añada o modifique estilos de punto en Trimble Geomatics Office o en la utilidad Trimble Feature and Attribute Editor.

Un estilo de punto

 es una definición que explica cómo dibujar un punto en Trimble Geomatics Office.

 incluye un símbolo, creado en la utilidad Symbol Editor.

La creación de un símbolo en la utilidad Symbol Editor no hace que el punto esté automáticamente disponible como un estilo de punto en Trimble Geomatics Office. A un punto se le asigna un estilo de punto, no un símbolo. El estilo de punto debe definirse utilizando el nuevo símbolo creado.

El Symbol Editor se abre automáticamente con la biblioteca de símbolos actual que utilice Trimble Geomatics Office. Los nombres de los símbolos de la biblioteca abierta se presentan en una lista de la pantalla. Utilícela para seleccionar el símbolo que quiere editar.

Usted puede ejecutar el editor independientemente de Trimble Geomatics Office. Seleccione el icono de acceso directo de la utilidad Symbol Editor desde la carpeta de Trimble Geomatics Office.

NOTA: Cuando ejecute el editor independientemente de Trimble Geomatics Office, las modificaciones que haya efectuado en el símbolo actual no se reflejan en ninguno de los proyectos actualmente abiertos. Para ver si se han aplicado los cambios, cierre el proyecto y vuelva a abrirlo. Los cambios efectuados estarán disponibles en la biblioteca de símbolos.

Para obtener más información, véase la ayuda de Trimble Symbol Editor.


Line Type Editor

La utilidad Trimble Line Type Editor™ (Editor de tipos de línea de Trimble), le permite editar bibliotecas de tipos de línea (*.ltp) utilizadas por Trimble Geomatics Office.

Para tener acceso a la misma, haga uno de los siguientes pasos:

 Seleccione Utilidades / Line Type Editor cuando haya un proyecto abierto.

 Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Use esta utilidad para crear o modificar tipos de línea existentes. Una vez que el archivo editado se registre como el archivo del sistema, los tipos de línea que usted cree son los que estarán disponibles cuando añada o modifique estilos de línea en Trimble Geomatics Office o en la utilidad Feature and Attribute Editor.

Un estilo de línea

 es una definición que explica cómo dibujar una línea en Trimble Geomatics Office.

 incluye un tipo de línea que se ha creado en la utilidad Line Type Editor.

La creación de un tipo de línea en la utilidad Line Type Editor no hace que éste esté automáticamente disponible como un estilo de línea en Trimble Geomatics Office. A una línea se le asigna un estilo de línea. El estilo de línea debe definirse utilizando el nuevo tipo de línea creado.

La utilidad Line Type Editor se abre automáticamente con la biblioteca de símbolos actual que utiliza Trimble Geomatics Office. Los nombres de los tipos de línea de la biblioteca abierta se presentan en una lista de la pantalla. Utilícela para editar los tipos de línea.

Usted puede ejecutar el editor independientemente de Trimble Geomatics Office. Seleccione el icono de acceso directo de la utilidad Line Type Editor desde la carpeta de Trimble Geomatics Office.

NOTA: Cuando ejecute el editor independientemente de Trimble Geomatics Office, las modificaciones que haya efectuado en la biblioteca de tipos de línea del sistema no se reflejan en el proyecto actual. Para ver si se han aplicado los cambios, cierre el proyecto y vuelva a abrirlo una vez que haya guardado dichos cambios. Los cambios guardados estarán disponibles en la biblioteca de tipos de línea.

Para obtener más información, véase la ayuda de Trimble Line Type Editor.


Grid Factory

Para instalar la utilidad Trimble Grid Factory™, utilice la opción de instalación personalizada.

Para tener acceso a la misma, una vez instalada, haga uno de los siguientes pasos:

  Seleccione Utilidades / Grid Factory cuando haya un proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Use la utilidad Trimble Grid Factory para trabajar con archivos de cuadrícula de datum (*.dgf) y archivos de geoide (*.ggf).

Use esta utilidad para crear cuadrículas secundarias a partir de cuadrículas existentes o para combinar múltiples cuadrículas existentes en una única cuadrícula. Usted puede subdividir archivos de cuadrícula de datum y archivos de cuadrícula de modelo geoidal utilizando Trimble Geomatics Office.

Si usa la utilidad Grid Factory para crear archivos de cuadrícula del geoide, asegúrese de que el nombre que introduce para el nuevo archivo es el mismo que el del modelo geoidal que creó en la utilidad Trimble Coordinate System Manager ™ (Administrador de sistemas de coordenadas de Trimble).

Las cuadrículas son grandes si el área geográfica que se abarca es extensa.

Por ejemplo, la cuadrícula de geoide OSU91 tiene un tamaño aproximado de 2 Mb. Los colectores de datos y receptores normalmente no tienen suficiente memoria para contener tantos datos. La cuadrícula OSU91 abarca todo el globo terráqueo pero la mayoría de los topógrafos no necesitan tanta cobertura. Normalmente sólo necesitan unas decenas o cientos de kilómetros cuadrados. Las cuadrículas que abarcan un área menor generalmente sólo tienen un tamaño de cientos de bytes.

Con la utilidad Grid Factory usted puede crear archivos de subcuadrícula del modelo geoidal que abarquen una zona local. Estos archivos son lo suficientemente pequeños como para cargarse en el dispositivo Trimble Survey Controller (versión 6 ó posterior) para utilizar en la zona local.

Muchos productos de Trimble se suministran con archivos de cuadrícula para conversión a modelos de datum y geoide que usted puede usar en la utilidad Grid Factory. Asimismo la utilidad Grid Factory importa archivos de cuadrícula extranjeros y los convierte al formato de cuadrícula de Trimble.

Para obtener más información, véase la ayuda de la utilidad Trimble Grid Factory.


DC File Editor

La utilidad Trimble DC File Editor™ (Editor de archivos DC de Trimble), le permite editar archivos de Survey Controller (*.dc).

Para tener acceso a la misma, haga uno de los siguientes pasos:

  Seleccione Utilidades / DC File Editor cuando no haya ningún proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

NOTA: Trimble recomienda que complete todo el trabajo de edición en Trimble Geomatics Office. De esta forma se garantiza que siempre tenga el archivo de dispositivo original para utilizar en caso de que se produzca algún problema durante la edición en Trimble Geomatics Office.

Use la utilidad Trimble DC File Editor para editar archivos de los siguientes dispositivos:

  Trimble

 SDR de Sokkia (hasta la versión 4-03)

  Cualquier archivo de dispositivo pueda convertirse al formato SDR

Para editar el contenido de un archivo .dc, use la utilidad Trimble DC File Editor. Por ejemplo, usted puede cambiar los datos erróneos capturados en el campo o añadir información que no estaba disponible en el campo.

NOTA: No se pueden editar atributos ni cambiar información de la biblioteca de características y atributos.

Para obtener más información véase la ayuda de la utilidad Trimble DC File Editor.


Feature and Attribute Editor

Use la utilidad Trimble Feature and Attribute Editor™ (Editor de características y atributos de Trimble), para administrar archivos de biblioteca de características y atributos (*.fcl) para el procesamiento de códigos de característica y la captura de datos de atributo GIS.

Para tener acceso a la misma, haga uno de los siguientes pasos:

  Seleccione Utilidades / Feature and Attribute Editor y atributos cuando no haya ningún proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Use la utilidad Trimble Feature and Attribute Editor para ver o editar archivos de biblioteca de características y atributos. Este tipo de biblioteca se utiliza para:

  el procesamiento de códigos de característica

  la captura de atributos

Un archivo .fcl es un archivo de texto que contiene definiciones de características, estilos CAD, y códigos de control. La definición de una característica puede incluir:

  un código para la característica

  los procedimientos CAD a efectuar en puntos asociados a esa característica

  los atributos requeridos para la característica

Usted puede crear bibliotecas de características y atributos nuevas. Asimismo puede usar la biblioteca de características y atributos predeterminada de Trimble Geomatics Office tal y como se suministra, o modificarla para adaptarla a sus requisitos personales.

Para obtener más información véase la ayuda de la utilidad Trimble Feature and Attribute Editor.


Coordinate System Manager

La utilidad Trimble Coordinate System Manager™ (Administrador de sistemas de coordenadas de Trimble), le permite el acceso a la base de datos del sistema de coordenadas (Current.csd).

Para tener acceso a la misma, haga uno de los siguientes pasos:

  Seleccione Utilidades / Coordinate System Manager cuando no haya ningún proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Con la utilidad Trimble Coordinate System Manager usted puede definir nuevos:

  parámetros elipsoidales

  transformaciones de datum

  sistemas de coordenadas

  definiciones de sistemas de coordenadas locales (ajustes locales)

  modelos geoidales

NOTA: La mayoría de los usuarios no necesita usar la utilidad Coordinate System Manager ya que Trimble suministra un conjunto completo de definiciones de sistemas de coordenadas predefinidas. Utilice Trimble Coordinate System Manager sólo si quiere añadir una definición de sistema de coordenadas adicional.

Trimble Geomatics Office utiliza la base de datos de sistemas de coordenadas para determinar los sistemas de coordenadas, modelos geoidales, y ajustes disponibles para seleccionar en un proyecto.

NOTA: Los Ajustes pueden crearse en Trimble Geomatics Office o en la utilidad Coordinate System Manager, y se almacenan en la base de datos geodésica.

Para obtener más información véase la ayuda de la utilidad Trimble Coordinate System Manager o el Manual de Trimble Geomatics Office.


Planning

La utilidad Planning le ayuda a planificar y programar sesiones de campo GPS. Utilícela antes de planificar sesiones GPS con el fin de determinar las condiciones adecuadas para topografiar con el GPS.

Para acceder a la misma, haga uno de los siguientes pasos:

  Seleccione Utilidades / Planning cuando no haya ningún proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Generalmente la primera etapa de la gestión de un proyecto topográfico es la planificación de misiones. El objetivo es definir todos los aspectos significativos del proyecto de forma que éste pueda realizarse con eficacia y eficiencia en cualquier tipo de condiciones previstas. Si se van a realizar levantamientos cinemáticos en tiempo real (RTK):

  use la utilidad Planning para comprobar que por lo menos va a haber cuatro satélites disponibles para obtener la inicialización de punto conocido y por lo menos va a hacer cinco para conseguir la inicialización al vuelo.

  compruebe los valores de dilución de precisión de posición (PDOP) para confirmar que las condiciones de geometría de satélites son adecuadas para el posicionamiento en tiempo real preciso.

NOTA: La utilidad Planning no se relaciona directamente con un proyecto de Trimble Geomatics Office y no almacena descripciones de sesión. Usted puede definir sesiones y utilizarlas durante la misma ejecución del programa.

La utilidad Planning puede ayudarle a:

  visualizar y predecir disponibilidad de satélites mediante tablas y representaciones gráficas

  experimentar con selección de satélites, almanaques, husos horarios, obstrucciones de visibilidad, y máscaras de elevación.

  determinar los mejores periodos de observación para una sesión, dados los límites de PDOP necesarios y las horas de trabajo del equipo de campo.

Para obtener más información véase la ayuda de la utilidad Planning.


Convert to RINEX

El formato de intercambio independiente entre receptores (Receiver INdependent EXchange (RINEX) es una representación ASCII de datos GPS capturados por receptores. La utilidad Convert to RINEX transforma archivos con formato binario .dat capturados con receptores Trimble Survey a archivos con formato ASCII RINEX. Usted puede ejecutar la utilidad independientemente de Trimble Geomatics Office.

Para acceder a misma, haga uno de los siguientes pasos:

  Seleccione Utilidades / Convert to RINEX cuando no haya ningún proyecto abierto.

  Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Use la utilidad para:

  seleccionar los archivos a convertir

  configurar los parámetros de conversión

  configurar la información del archivo de salida para antenas y cabeceras

  convertir los archivos seleccionados al formato RINEX

La utilidad Convert to RINEX puede crear tres tipos de archivos RINEX:

  Observación (observaciones brutas GPS con información de antena de estación)

  Navegación (órbitas GPS)

  Meteorológica (presión, temperatura, y humedad relativa)

La utilidad crea archivos de Navegación y Observación RINEX predeterminados. Asimismo usted puede querer crear un archivo meteorológico RINEX.

Para obtener más información, consulte la ayuda de la utilidad Trimble Convert to RINEX.


A1 Viewer

La utilidad A1 Viewer le permite ver el contenido de un archivo del proyecto de GPSurvey (*.A1), luego extraer (guardar) los archivos seleccionados en un directorio de destino. La utilidad A1 Viewer funciona independientemente de GPSurvey, por lo tanto no necesita cargar este software en la computadora. Después de guardar los archivos de datos del proyecto de GPSurvey, se podrán usar las funciones para importar en Trimble Geomatics Office a fin de importar los datos al proyecto actual.

Para acceder a la utilidad A1 Viewer, seleccione una de las siguientes alternativas:

 Seleccione Utilidades / A1 Viewer cuando no hay un proyecto abierto.

 Selecciónela en el menú Inicio de Microsoft Windows en cualquier momento.

Importador de coordenadas GPSurvey

La opción Importador de coordenadas GPSurvey (Coordenadas GPSurvey [curr_net.dat] ) le permite importar coordenadas ajustadas de un archivo Curr_net.dat. Para acceder a este software:

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	En la ficha Levantamiento, seleccione Coordenadas GPSurvey (Curr_net.dat) y haga clic en Aceptar. Aparecerá el diálogo Abrir.

NOTA: El archivo debe tener el nombre curr_net.dat para que se importe sin problemas.

3.	Navegue al archivo y haga clic en Aceptar.

En este momento podrá importar coordenadas ajustadas de un archivo Curr_net.dat.

Archivos soportados por la utilidad A1 Viewer

Para la visualización, solamente está disponibles los archivos que GPSurvey ha archivado:

  archivos .ssf/.ssk − estos archivos contienen los resultados de la solución de la línea base del procesador WAVE de GPSurvey. Los mismos se importan al proyecto de Trimble Geomatics Office usando el formato para importar de los archivos SSF/SSK (*.ssf,*.ssf), que está disponible en la ficha Levantamiento del diálogo Importar.

  archivos de datos GPS − estos archivos contienen los datos brutos GPS que se han capturado en el campo. Los dos tipos de archivos, *.dat (archivos de datos brutos GPS de un receptor de Trimble) y *.rnx (archivos de datos brutos RINEX convertidos para utilizarlos con el procesador WAVE), están disponibles cuando se selecciona este filtro. Nuevamente, ambos tipos de archivo (.dat y .rnx) se importan a un proyecto usando el formato para importar de los archivos de datos GPS (*.dat).

NOTA: Para ver los archivos *.rnx disponibles en el diálogo Abrir del formato para importar de los archivos de datos GPS, en el campo Archivos de tipo, seleccione Todos los archivos *.*.

  archivos de coordenadas ajustadas − estos archivos, Curr_net.dat y Coords.log, contienen las coordenadas ajustadas de un proyecto de GPSurvey archivado. El archivo Curr_net.dat se utiliza para importar las coordenadas a Trimble Geomatics Office. El archivo Coords.log está en el formato ASCII y solamente está disponible para verlo con un editor de texto. Los puntos en el proyecto de GPSurvey pueden estar en el formato de coordenadas de cuadrícula o geográficas y en cualquier sistema de coordenadas. Para que la importación de coordenadas funcione de forma correcta, el sistema de coordenadas de las propiedades del sistema de coordenadas del proyecto de Trimble Geomatics Office debe coincidir, con exactitud, con las propiedades del sistema de coordenadas del proyecto de GPSurvey.

El archivo (Curr_net.dat) se importa a un proyecto usando el formato para importar de las coordenadas de GPSurvey (Curr_net.dat). Al leer el archivo (Curr_net.dat), el software identifica las coordenadas que eran fijas durante el ajuste de GPSurvey. En el archivo, debe haber por lo menos un componente de coordenada fijo (NE, e, h) antes de importar todos los componentes de coordenadas del mismo tipo. Por ejemplo, se necesita una elevación fija antes de importar elevaciones. A todos los componentes importados se les asigna la calidad de control.

  archivos .ggf − estos archivos contienen los datos geoidales de los Archivos de cuadrícula de geoide (*.ggf) creados en un proyecto de GPSurvey o importados al mismo. Estos archivos se crean utilizando la función Modelo geoidal residual en el software TRIMNet Plus. Este filtro no mostrará los archivos .ggf Globales (es decir, WW15MGH, GEOID99) que estaban disponibles en GPSurvey. Para emplear el archivo .ggf en Trimble Geomatics Office, guarde el archivo .ggf en la carpeta Archivos del programa\Archivos comunes\Trimble\GeoData, luego utilice la utilidad Coordinate System Manager para añadir el geoide a la base de datos del sistema de coordenadas. Para más información sobre el empleo de esta utilidad, consulte la ayuda de Coordinate System Manager.

Empleo del Modo una altura en TRIMNet Plus

Al importar coordenadas de GPSurvey de un proyecto utilizando el Modo una altura en TRIMNet Plus, el campo Altura en el proyecto de Trimble Geomatics Office contendrá el valor de la elevación. Ello se debe a que durante el ajuste del Modo una altura, TRIMNet Plus usa el campo Altura elipsoidal para la elevación (altura ortométrica). Si no sabe cuál es el modo que se ha utilizado para un proyecto de GPSurvey, abra el proyecto en GPSurvey y compruebe las configuraciones de control especiales en TRIMNet Plus.

Empleo de información de efemérides precisa

La función archivar del proyecto de GPSurvey no archivará información de efemérides precisa utilizada durante el procesamiento de líneas base en el software WAVE. Si, la información de efemérides precisa se ha empleado durante el procesamiento de líneas base en el proyecto de GPSurvey, ,deberá importarla a Trimble Geomatics Office desde la fuente original.


Modelos de antena NGS

Con Trimble Geomatics Office, se podrá utilizar uno de los dos conjuntos de modelos de antena, Trimble o NGS. Los requerimientos topográficos determinan el conjunto de modelos de antena a utilizar. Por lo general, el modelo de antena NGS se usará cuando se emplean distintos tipos de antena con respecto a los definidos en Antenna.ini.

El conjunto de antenas de Trimble está instalado como el valor por defecto. Sin embargo, para instalar los modelos de antena NGS, en la ficha Global del diálogo Estilos de procesamiento de líneas base GPS, seleccione la opción NGS en la lista de modelos de antena.


 Comando Vista del levantamiento

Utilice este comando para ver el proyecto en la vista del levantamiento.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver / Levantamiento.

  Seleccione la herramienta Vista del levantamiento.


Vista del levantamiento -Visión de conjunto
 Vista del levantamiento − Visión de conjunto

 Véase también

Un proyecto puede verse en la vista del levantamiento o en la vista del plano.

Use la vista del levantamiento para realizar tareas relacionadas con levantamientos, tales como:

  comprobar observaciones GPS y observaciones terrestres.

  corregir datos erróneos.

Algunas opciones de menú y barras de herramientas sólo están disponibles en la vista del levantamiento. Le permiten realizar tareas relacionadas con levantamientos, tales como procesamientos de líneas base, y ajustes de red.

SUGERENCIA: Para ver partes diferentes del proyecto a la vez, cree ventanas múltiples. Para obtener más información, véase el comando Nueva ventana.

Visualización de datos del levantamiento

Las observaciones GPS y las observaciones terrestres se visualizan como líneas en la vista del levantamiento.

Haga doble clic en la línea de una observación para ver ésta última utilizando la ventana Propiedades, y si es necesario, edite la observación. Si hay un error de cierre fuera de tolerancia o si una observación GPS no logra pasar el criterio de rechazo se muestran indicadores en los puntos u observaciones pertinentes.

Los colores de línea diferentes representan estados diversos, derivados de la configuración de Estilo leyenda en la ficha Leyenda topográfica del diálogo Opciones vista. Los puntos de control y puntos de red ajustados también tienen visualizaciones especiales en la vista del levantamiento.

Tareas disponibles en la vista del levantamiento

Las siguientes tareas sólo están disponibles en la vista del levantamiento:

  Filtros de vista

  Seleccione Observaciones

  Opciones de informe sobre módulos de cierre GPS

Si tiene instalados los módulos Baseline Processing (Procesamiento de líneas base) y Network Adjustment (Ajuste de la red) podrá tener acceso a tareas adicionales relacionadas con levantamientos.

Las tablas siguientes muestran las tareas adicionales disponibles en cada uno de estos módulos:

Módulo Baseline Processing

Módulo Network Adjustment

Cambio de vistas

Se pueden cambiar vistas en cualquier momento.

Para cambiar a la vista del plano, realice uno de los siguientes pasos:

  Seleccione la herramienta Vista del plano

  Seleccione Ver / Plano.


 Comando Vista del plano

Utilice este comando para ver el proyecto en la vista del plano.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver/ Plano.

  Seleccione la herramienta Vista del plano.


Vista del plano - Visión de conjunto
 Vista del plano − Visión de conjunto

Véase también

El proyecto puede verse en la vista del plano o en la vista del levantamiento.

Utilice la vista del plano para ver características topográficas observadas durante el levantamiento en el campo.

Usted puede añadir puntos, líneas, estilos, y anotaciones para mejorar la presentación del proyecto. Todos los cambios efectuados en la vista del plano no afectan las observaciones básicas del levantamiento.

Algunas opciones de menú y barras de herramientas sólo están disponibles en la vista del plano. Estas opciones le permiten realizar tareas relacionadas con CAD (tales como la codificación de características, control de capas, y administración de estilos).

SUGERENCIA: Para ver partes diferentes del proyecto a la vez, cree ventanas múltiples. Para obtener más información, véase comando Nueva ventana.

Las entidades (puntos, líneas, curvas, arcos, texto, y anotaciones) se muestran en función del estilo que se les haya dado. Usted puede cambiar el estilo de una entidad mediante la codificación de características o con la ventana Propiedades. Las observaciones GPS y las observaciones convencionales no se visualizan. Si se añade una línea en la vista del plano, se añadirá una nueva entidad a la base de datos.

Si se cambia a la vista del levantamiento, no se visualizarán las líneas CAD.

Una vez que haya completado las tareas en la vista del plano, podrá imprimir o exportar el plano al módulo de software de diseño que utilice.

Tareas disponibles en la vista del plano

Las siguientes tareas sólo están disponibles en la vista del plano:

  Capas

  Estilos (Punto, Línea, Texto)

  Insertar puntos

  Insertar líneas

  Insertar texto

  Insertar anotaciones

  Insertar líneas para observaciones actuales

  Seleccionar por capas

  Seleccionar por estilos

  Seleccionar por tipos

  Seleccionar por código de característica

  Codificación de características

  DTMLink

  RoadLink

Cambio de vistas

Las vistas pueden cambiarse en cualquier momento.

Para cambiar a la vista del levantamiento, realice uno de los siguientes pasos:

  Seleccione la herramienta Vista del levantamiento.

  Seleccione Ver/ Levantamiento.

  Presione Alt+1.


Comando Acercar

Utilice este comando para aumentar una zona de la ventana gráfica.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver/ Zoom / Acercar.

  Seleccione la herramienta Acercar [image].

Si tiene visualizado el navegador de zoom, la zona que se esté viendo en la ventana gráfica se muestra como un cuadro negro en la ventana del navegador de zoom.

Para utilizar la herramienta Acercar:

1.	Mueva el puntero sobre la ventana gráfica.

El puntero de aumento se muestra con un signo más en su interior. El punto interactivo queda marcado por las cruces que hay sobre este puntero.

2.	Realice uno de los siguientes pasos:

  Haga clic en una posición de la ventana gráfica para efectuar un zoom para acercar por un factor de dos, centrado en el punto interactivo.

  Haga clic en el puntero y arrástrelo por la ventana gráfica para crear un rectángulo que contenga la zona en la que quiere efectuar el zoom para acercar. Cuanto más pequeña sea la zona, mayor será el cambio de escala. Cuando se suelte el botón del ratón, el contenido de la zona del rectángulo ocupará toda la ventana gráfica. Para cancelar la operación actual de la herramienta Zoom para acercar, presione Esc mientras presiona el botón del ratón.

Si tiene un ratón con una rueda, utilice la rueda para efectuar un zoom para acercar o para alejar. Para realizar un pan con la rueda, mantenga la rueda presionada y arrastre el ratón. El contenido de la ventana gráfica se mueve a medida que usted desplaza el ratón.


Comando Alejar

Utilice este comando para reducir una zona de la ventana gráfica

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver/ Zoom / Alejar.

  Seleccione la herramienta Alejar [image].

Si tiene visualizado el navegador de zoom, la zona que se esté viendo en la ventana gráfica se muestra como un cuadro negro en la ventana del navegador de zoom. Si se efectúa un zoom para alejar más allá del alcance del proyecto, no se visualiza ningún cuadro negro en el navegador de zoom.

Para utilizar la herramienta Alejar:

1.	Mueva el puntero sobre la ventana gráfica.

El puntero de aumento se muestra con un signo menos en su interior. El punto interactivo queda marcado por las cruces que hay sobre este puntero.

2.	Realice uno de los siguientes pasos:

 Haga clic en una posición de la ventana gráfica. La escala de la ventana gráfica cambia y se centra en el punto interactivo.

  Haga clic en el puntero y arrástrelo por la ventana gráfica para crear un rectángulo que contenga la zona en la que quiere efectuar el zoom para alejar y a continuación suelte el botón del ratón. La escala de la ventana gráfica cambia, y la información anteriormente presentada en la ventana gráfica aparece en la zona seleccionada del rectángulo. Cuanto más pequeño sea el rectángulo, mayor será el cambio de escala. Para cancelar la operación actual de la herramienta Zoom para alejar, presione Esc mientras presiona el botón del ratón.

Si tiene un ratón con una rueda, utilice la rueda para efectuar un zoom para acercar o para alejar. Para realizar un pan con la rueda, mantenga la rueda presionada y arrastre el ratón. El contenido de la ventana gráfica se mueve a medida que usted desplaza el ratón.


Comando Alcance del zoom

Utilice este comando para ver todos los puntos visibles del proyecto actual. Cuando seleccione este comando, la ventana gráfica se ajusta automáticamente de forma que todos los datos sean visibles.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver / Zoom / Alcance.

  Presione Ctrl+E.

  Seleccione la herramienta Alcance del zoom [image].

  Ubique el puntero sobre la ventana gráfica. Haga clic en el botón derecho del ratón, y seleccione Alcance del zoom en el menú de acceso directo.


Comando Zoom anterior

Utilice este comando para volver a todas las vistas de zoom anteriores desde que abrió el proyecto.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver/ Zoom / Anterior.

  Seleccione la herramienta Zoom anterior [image].

Si tiene visualizado el navegador de zoom, la zona que se esté viendo en la ventana gráfica se muestra como un cuadro negro en la ventana del navegador de zoom. Si se efectúa un zoom para alejar más allá del alcance del proyecto, no se visualiza ningún cuadro negro en el navegador de zoom.

Si tiene abiertas varias ventanas gráficas, para cada ventana se almacenan los zooms pertinentes por separado.


Comando Pan

Utilice este comando para cambiar el centro de la vista gráfica de forma que se visualice una zona diferente de la vista de la pantalla.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver/ Pan.

  Seleccione en la herramienta Pan [image].

Aparece el puntero de la mano.

Si tiene visualizado el navegador de zoom, la zona que se esté viendo en la ventana gráfica se muestra como un cuadro negro en la ventana del navegador de zoom. Si se efectúa un pan más allá del alcance del proyecto, no se visualiza ningún cuadro negro en el navegador de zoom.

La panoramización no se recuerda como ocurre con el zoom. Por ello, no podrá realizar un zoom anterior para regresar a la vista original anterior a la panoramización.

Para utilizar la herramienta Pan:

1.	Mueva el puntero sobre la ventana gráfica.

El punto interactivo queda marcado por las cruces que hay sobre este puntero.

2.	Haga clic en el puntero y arrástrelo donde quiere efectuar el pan. El contenido de la ventana gráfica se mueve en tiempo real a medida que usted desplaza el ratón.

Si tiene un ratón con una rueda, utilice ésta para efectuar un zoom para acercar o para alejar. Para panoramizar con la rueda, mantenga ésta presionada y arrastre el ratón. El contenido de la ventana gráfica se mueve a medida que usted desplaza el ratón.


Comando Pan a

Utilice este comando para efectuar un pan y dar escala a una ubicación concreta de la ventana gráfica.

Aparece el diálogo Pan a.


Diálogo Pan a

Utilice este diálogo para efectuar un pan y dar escala a una ubicación concreta de la ventana gráfica.

Para acceder al mismo, seleccione Ver / Pan a.

Centro de la vista

Estos campos le permiten completar las acciones de Rellenar campo, tales como la especificación de nombres o ubicaciones para el centro de la vista.

Nombre pto	Use este campo para especificar el nombre del punto de la base de datos. Si utiliza Rellenar campo, se completarán los campos Nombre pto, Norte y Este.
Norte/Este	Use estos campos para el centro de la vista. Si utiliza Rellenar campo, se rellenarán los campos Norte y Este.
Radio para vista

Este campo especifica el alcance de la vista. Si no se especifica una unidad, se utilizará la unidad de distancia configurada en la ficha Unidades y formato del diálogo Propiedades proyecto.


    Comando Filtros

Utilice este comando para abrir el diálogo Filtros de vista.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver / Filtros.

  Seleccione la herramienta Filtros de vista [image].

  Haga clic en el icono Filtros de vista [image] de la barra de estado.


    Diálogo Filtros de vista

Utilice este diálogo para filtrar todas las observaciones que no quiera ver mientras trabaja en la vista del levantamiento.

NOTA: Los datos que han sido ocultados por el filtro de vista no pueden seleccionarse utilizando ninguno de los comandos del menú Seleccionar.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver / Filtros.

  Seleccione la herramienta Filtros de vista.

  Presione Ctrl+F.

Observaciones

Utilice este grupo para seleccionar los grupos de observaciones que quiera ver. Esto es útil si se tiene un proyecto con varios tipos de observaciones, por ejemplo RTK y convencionales, y usted sólo quiere ver las observaciones RTK.

Mostrar todas las observaciones

Seleccione esta opción para ver todas las observaciones del proyecto. Esta opción aparece si tiene instalado el módulo Network Adjustment.

Mostrar sólo observaciones marcadas para el ajuste

Seleccione esta opción para ver sólo las observaciones para las que se ha seleccionado la casilla de verificación Usar en ajuste de la red. (Esta casilla de verificación está disponible en la página Resumen de la ventana Propiedades.)

Esta opción aparece si tiene instalado el módulo Network Adjustment. Si selecciona esta opción, algunos campos de los grupos de observación no están disponibles.

Mostrar sólo observaciones que se pueden ajustar

Seleccione esta opción para ver sólo las observaciones que pueden utilizarse en un ajuste de red, pero para las que no se ha seleccionado necesariamente la casilla de verificación Usar en ajuste de la red. ((Esta casilla de verificación está disponible en la página Resumen de la ventana Propiedades.)

Por ejemplo, las observaciones inhabilitadas y las observaciones habilitadas como comprobación se podrán seleccionar si pueden utilizarse en un ajuste de la red.

Las posibles líneas base y observaciones convencionales (que no pueden utilizarse en un ajuste de red) se filtran.

NOTA: Esta opción aparece si tiene instalado el módulo Network Adjustment. Si selecciona esta opción, algunos de los campos de los grupos de observación no están disponibles.

Tipos de observaciones a mostrar

Este grupo contiene las siguientes casillas de verificación:

  RTK

  Cinemático PP

  Láser

  Incrementos elevación

  Estático

  Terrestres

  Reducidas

  Acimut

  Líneas base sin procesar

Use estas casillas de verificación para seleccionar los tipos de observación que quiere ver. Por ejemplo, para ver solamente los vectores RTK, seleccione la casilla de verificación RTK e inhabilite las otras del grupo.

  Observaciones de tomas aisladas

  Continua

  Observaciones inhabilitadas

  Observaciones de comprobación

Use estas casillas de verificación para seleccionar las observaciones de los tipos seleccionados que quiere ver. Usted debe especificar el tipo de observación del grupo superior que quiere filtrar con el grupo inferior.

Por ejemplo, para ver solamente las observaciones de comprobación RTK, seleccione casillas de verificación RTK y Comprobar e inhabilite el resto de las casillas del grupo.

NOTA: Si una observación tiene varias propiedades, y usted quiere visualizarlas; deberá seleccionar todas las casillas de verificación pertinentes al tipo de observación.

Muestra puntos sin conectar

Seleccione esta casilla de verificación para que se muestren los puntos sin observaciones que radien del o hacia los mismos. Por ejemplo, los puntos tecleados.

Mostrar eventos

Seleccione esta casilla de verificación para mostrar eventos.

Mostrar sólo datos en el conjunto de selección

Seleccione esta casilla de verificación para mostrar los datos que ha guardado con anterioridad como el conjunto de selección.  Seleccione el conjunto de selección en la lista.

Usar Timeline para mostrar líneas base GPS dependientes

Cuando esta casilla está verificada, solamente se mostrarán, en la ventana gráfica, las observaciones que se visualizan en la vista de Timeline.

Esta herramienta se puede utilizar para seleccionar líneas base independientes para el ajuste de red.

Use el botón Vista de línea base dependiente en la barra de herramientas para habilitar e inhabilitar esta opción.

NOTA: Esta opción solamente se aplica a los datos GPS con posprocesamiento. Todos los demás datos se mostrarán en la ventana de gráficos, con los correspondientes filtros de vista aplicados.

NOTA: Esta opción sólo está disponible si tiene instalado el módulo Network Adjustment.

Hora

Seleccione esta casilla de verificación para mostrar sólo las observaciones GPS que se encuentren en un rango de hora y fecha determinado. Los campos De y A están habilitados.

De / A

Utilice Rellenar campo (seleccione la hora en la regla de Timeline o utilice el teclado para introducir el rango de hora y fecha de las observaciones GPS a visualizar). También podrá introducir el día juliano.


Etiquetas de punto - Visión de conjunto
Etiquetas de punto − Visión de conjunto

Más información

Cómo ...	Véase también

Visión de conjunto

Para visualizar información acerca de entidades en la ventana gráfica y no almacenar dicha información en la base de datos, utilice etiquetas. Estas están disponibles en las vistas del levantamiento y del plano.

Las configuraciones de etiquetas se restauran cuando se abren proyectos entre sesiones de trabajo. Para almacenar información acerca de entidades en la base de datos del proyecto, utilice anotaciones. Sólo pueden añadirse anotaciones en la vista del plano.

Usted puede etiquetar puntos con combinaciones de campos y texto definido por el usuario. Para agregar opciones de etiquetas personalizadas, utilice un editor de texto para editar el archivo Options.ini. Las etiquetas siempre se muestran a la derecha del punto que se está etiquetando.

Las etiquetas se visualizan mostrando la fuente y tamaño asignado a las sugerencias de las configuraciones de apariencia de Microsoft Windows.


Comando Barra de proyectos

Utilice este comando para mostrar y ocultar la barra de proyectos.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver / Barra de proyectos.

  Seleccione la herramienta Barra de proyectos [image].


Comando Refrescar

Utilice este comando para refrescar la pantalla.

Para acceder al mismo, realice uno de los siguientes pasos:

  Seleccione Ver / Refrescar.

  Presione F5.

Seleccione este comando para volver a dibujar la vista del plano cuando la ventana gráfica esté sobrescrita y resulte difícil de leer.


Diálogo Opciones vista

Use este diálogo para personalizar la vista de los datos. Para acceder al mismo, seleccione Ver / Opciones.

El diálogo Opciones vista tiene las siguientes fichas:

  Líneas de la cuadrícula

  Leyenda topográfica

  Datos topográficos

  Error controles de elipse

  Mapa de fondo


Diálogo Rótulos punto (etiquetas)

Use este diálogo para mostrar las etiquetas de punto para el proyecto.

Para acceder a la misma, en el menú principal, seleccione Ver / Rótulos punto.

Rotular puntos con

Seleccione los campos con los que quiere etiquetar los puntos. Las siguientes opciones se proveen con Trimble Geomatics Office. En esta lista, aparecerán las opciones de etiquetas personalizadas que se añaden usando el archivo Options.ini:

  Nombre

  Código característica

  Elevación

  Factor de escala (cuadrícula)

  Factor de escala elevación

  Factor de escala combinado

  Angulo convergencia

  Calidad horizontal

  Calidad elevación

  Calidad altura

Aplicar a

Hay dos opciones disponibles para etiquetar puntos:

  Selección − seleccione esta opción para etiquetar los puntos seleccionados.

  Toda base datos − seleccione esta opción para etiquetar todos los puntos. Cuando no hay nada seleccionado en la vista del levantamiento, esta opción estará seleccionada por defecto.

Al etiquetar una selección, Trimble Geomatics Office automáticamente produce un conjunto de selección nombrado de los puntos etiquetados.

NOTA: Sólo se podrá etiquetar una selección por vez. Si tiene una selección de puntos etiquetados y luego etiqueta una nueva selección, se deseleccionarán los rótulos en la primera selección.

Borrar

Haga clic en Borrar para quitar todos las etiquetas.

NOTA: Las configuraciones de etiquetas se restaurarán si se vuelve a abrir un proyecto con etiquetas de punto.

SUGERENCIA: Para cambiar el tipo de fuente y el tamaño del texto, use las configuraciones de visualización de Ventana comunes de Microsoft Windows para Información sobre herramientas.


Diálogo Opciones vista - Ficha Líneas de la cuadrícula
Diálogo Opciones vista − Ficha Líneas de la cuadrícula

Use esta ficha para mostrar las líneas de la cuadrícula en la ventana de gráficos.

Para acceder a la misma:

1.	Seleccione Ver / Opciones. Aparecerá el diálogo Opciones de vista.

2.	Seleccione la ficha Líneas de la cuadrícula.

Mostrar líneas de la cuadrícula

Seleccione esta casilla de verificación para mostrar líneas de la cuadrícula en la ventana de gráficos. Cuando se muestran las líneas de la cuadrícula, el intervalo de cuadrícula se visualizará en la barra de estado.

NOTA: También se podrán mostrar líneas de cuadrícula seleccionando el botón de líneas de cuadrícula [image] en la barra de herramientas.

Los siguientes elementos estarán disponibles:

Nº fijo de líneas de la cuadrícula

Use esta opción para configurar el número de líneas de la cuadrícula que se muestran en la pantalla. Cuando se hace un zoom para acercar o para alejar, se mostrará el mismo número de líneas de cuadrícula.

NOTA: El número fijo de líneas de cuadrícula se mostrará junto al lado más corto de la pantalla.

Intervalo cuadrícula

Use esta opción para especificar el intervalo de cuadrícula. Las unidades de distancia serán las especificadas para el proyecto.

NOTA: Si hay demasiadas líneas de cuadrícula a mostrar claramente en la pantalla, las mismas no se visualizarán.

Tipo de línea de la cuadrícula

Use esta opción para seleccionar el estilo de líneas de cuadrícula, por ejemplo, continua o de puntos.

Color de línea de la cuadrícula

Use esta opción para seleccionar el color de las líneas de cuadrícula. Tal vez necesite cambiar el color de las líneas de cuadrícula para que se vean con claridad contra el color de fondo de la ventana de gráficos.

Etiquetar líneas de la cuadrícula

Seleccione esta casilla de verificación para etiquetar las líneas de cuadrícula con los valores norte y este.

NOTA: Las líneas de cuadrícula se imprimirán al seleccionar el comando Dibujar/Imprimir.


Diálogo Opciones vista - Ficha Leyenda topográfica
Diálogo Opciones vista − Ficha Leyenda topográfica

Use esta ficha para cambiar los colores empleados para mostrar el proyecto en el ventana de gráficos de Trimble Geomatics Office. La misma determina:

  cómo se mostrarán los diferentes tipos de observaciones y puntos en la vista del levantamiento

  el color de fondo de la ventana de gráficos

  el color por defecto para el texto

Para acceder a la misma:

1.	Seleccione Ver / Opciones. Aparecerá el diálogo Opciones de vista.

2.	Seleccione la ficha Leyenda topográfica.

Estilo leyenda

En este campo, seleccione Negro o Por defecto. La siguiente tabla describe las configuraciones de color que cada opción determina:


Diálogo Opciones vista - Ficha Datos topográficos
Diálogo Opciones vista − Ficha Datos topográficos

Use esta ficha para cambiar la manera en que se muestran los datos en la ventana de gráficos.

Para acceder a la misma:

1.	Seleccione Vista / Opciones. Aparecerá el diálogo Opciones de vista.

2.	Seleccione la ficha Datos topográficos.

NOTA: Esta ficha sólo es visible cuando está en la vista del levantamiento.

Usar fragmentos de vectores para las tomas aisladas

Seleccione esta casilla de verificación para mostrar los vectores de observaciones de tomas aisladas como fragmentos.

Mostrar número de observaciones (donde > 1)

Seleccione esta casilla de verificación para mostrar el número de observaciones de varias líneas observadas.

Cuando se filtra una observación, el número de observaciones se mostrará como una razón de lo que se muestra con respecto al número total de observaciones, por ejemplo, 1/3.


Diálogo Opciones vista - Ficha Error controles de elipse
Diálogo Opciones vista − Ficha Error controles de elipse

Use esta ficha para determinar si las elipses de error, las flechas de error de altura y las flechas de error de elevación aparecerán en la ventana de gráficos después de un ajuste. También se podrá determinar la escala de elipses de error y el tamaño de las marcas de verificación.

Para acceder a la misma:

1.	Seleccione Ver / Opciones. Aparecerá el diálogo Opciones de vista.

2.	Seleccione la ficha Error controles de elipse.

NOTA: Esta ficha solamente está disponible cuando está en la ficha levantamiento.

Muestra elipses error de punto & flechas

Seleccione esta casilla de verificación para mostrar elipses de error de punto y flechas.

Mostrar errores de elevación

Seleccione esta casilla de verificación para mostrar los errores de elevación.

Mostrar errores altura

Seleccione esta casilla de verificación para mostrar errores de altura.

Escala de la elipse de error

La corredera de Escala de la elipse de error, que se muestra a continuación, controla el tamaño de las elipses de error que aparecen en la ventana de gráficos tras un ajuste.

Para achicar las elipses, mueva la corredera a la izquierda. Para agrandarlas, mueva la corredera a la derecha.

Tamaño de la marca

Use este campo, que se muestra a continuación, para determinar la distancia entre las marcas de verificación que aparecen en las escalas de la barra de elipse en la ventana de gráficos.

Las escalas de barra se alargan cuando se aumenta el tamaño, en tanto que la distancia entre las marcas de verificación cambia para coincidir con el valor que aparece en el campo Tamaño de las marcas.


Diálogo Opciones vista - Ficha Mapa de fondo
Diálogo Opciones vista − Ficha Mapa de fondo

Trimble Geomatics Office puede mostrar los archivos de fondo en la ventana de gráficos. Se podrán importar archivos de fondo tales como Drawing Exchange Format (.dxf), bitmaps de Windows (.bmp), o con el formato Tagged Image File (.tif) para visualizarlos. Los archivos Bitmap (.bmp) de Windows, o con el formato Tagged Image File (.tif) deben estar georeferenciados para que se muestren correctamente.

El formato de archivo World de ESRI se utiliza para georeferenciar archivos de fondo. Un archivo World es un archivo de texto ASCII con una extensión .tfw o .wld. Trimble Geomatics Office tiene los siguientes requerimientos para los archivos World. Estos deberán:

  estar almacenados en la misma ubicación como el archivo .dxf, .bmp o .tif relacionado

  tener el mismo sistema de coordenadas que el proyecto de Trimble Geomatics Office

  tener las mismas unidades que el proyecto de Trimble Geomatics Office

NOTA: Trimble Geomatics Office soporta archivos TIFF descomprimidos y los siguientes esquemas de compresión: CCITT, PackBits, Thunder, Next, LogLuv. Sin embargo, no soporta los siguientes archivos comprimidos: OJPEG, JPEDG, ZIP, LZW, PixarLog.

NOTA: Trimble Geomatics Office tampoco soporta archivos .bmp comprimidos RLE.

Use la ficha Mapa de fondo para seleccionar un archivo de fondo para mostrar.

Para acceder a la misma:

1.	Seleccione Ver / Opciones. Aparecerá el diálogo Opciones de vista.

2.	Seleccione la ficha Mapa de fondo.

Nombres de archivo

Este grupo muestra una lista de archivos que han sido seleccionados para utilizarlos como mapas de fondo.

Añadir

Use el botón Añadir para seleccionar los archivos de fondo.  Se podrá seleccionar un archivo .dxf, .bmp, o .tif.

NOTA: Asegúrese de que el archivo World relacionado esté almacenado en el mismo lugar. No es necesario seleccionar este archivo en la lista.

Quitar

Use el botón Quitar para quitar un archivo de fondo de la lista.

Formato de archivo World

A continuación se muestra un formato de archivo World:

20.17541308822119

0.00000000000000

0.00000000000000

–20.17541308822119

424178.11472601280548

4313415.90726399607956

Estos 6 valores se usan para calcular una transformación de imagen a world utilizando una transformación afín de seis parámetros con la siguiente forma:

x1 = Ax + By + C

y1 = Dx + Ey + F

Donde

x1 	coordenada x calculada del píxel en el mapa

y1 	coordenada y calculada del píxel en el mapa

x 	número de columna de un píxel en la imagen

y 	número de hilera de un píxel en la imagen

A 	escala x; dimensión de un píxel en unidades del mapa en dirección x

B, D	términos de rotación

C, F	términos de traslación, coordenadas x, y del mapa del centro del píxel superior izquierdo

E 	negativo de la escala y; dimensión de un píxel en unidades del mapa en dirección y

Los parámetros de transformación están almacenados en el archivo world en el siguiente orden:

20.17541308822119 – A

0.00000000000000 – D

0.00000000000000 – B

-20.17541308822119 – E

424178.11472601280548 – C

4313415.90726399607956 – F

NOTA: Trimble Geomatics Office no soporta la rotación de imágenes. Si el archivo World tiene términos de rotación distintos de cero (parámetros D y B), éstos no se utilizarán.

NOTA: El signo de la escala x (A) o de la escala y (E) cambia según la orientación del sistema de coordenadas. Ello se debe a que los orígenes de una imagen y el sistema de coordenadas son diferentes. El origen de una imagen siempre está en el ángulo superior izquierdo, mientras que el origen de un sistema de coordenadas geográfico cambia de acuerdo con la dirección de la coordenada.

Por ejemplo, para un sistema de coordenadas NE, el origen del sistema de coordenadas del mapa está ubicado en el ángulo inferior izquierdo. Los valores de fila en la imagen aumentan desde el ángulo superior izquierdo hacia abajo, en tanto que los valores de coordenada y en el mapa aumentan desde el ángulo inferior izquierdo hacia arriba. Por lo tanto, para un sistema NE, la escala y (E) es negativa. La siguiente tabla resume el signo de las escalas x e y que se deben utilizar para los sistema de coordenadas NE, SE y NO:

	NE	SO	NO
x(A)	+ve	-ve	-ve
y(E)	-ve	+ve	-ve


Garantía

Garantía limitada del firmware y del software

Trimble garantiza que este producto de software (el “Software”) cumple de forma substancial con las especificaciones publicadas aplicables de Trimble para el Software por un período de noventa (90) días, a contar desde el día de entrega.

Remedios de la garantía

La única responsabilidad de Trimble, y su exclusivo remedio de acuerdo con la garantía establecida anteriormente, consistirá, a juicio de Trimble, en la reparación o el reemplazo de todo Producto o Software que no esté en conformidad con dicha garantía (“Producto no conforme”) o en el reembolso del precio de compra que se haya abonado por todo Producto no conforme, contra la devolución del mismo a Trimble.

Exclusiones de la garantía

Estas garantías se aplicarán únicamente en los siguientes casos y con el siguiente alcance: (i) los Productos y el Software están instalados, configurados, conectados mediante interfaz, almacenados, mantenidos y manejados de forma adecuada y correcta de acuerdo con las especificaciones y el manual de funcionamiento correspondiente de Trimble, y (ii) los Productos y el Software no se han modificado o utilizado incorrectamente. Las garantías anteriores no se aplicarán a, y Trimble no será responsable de, ningún reclamo por incumplimiento de la garantía que se basa en (i) defectos o problemas de funcionamiento que surjan de la combinación o utilización del Producto o Software con productos, información, sistemas o dispositivos no fabricados, proporcionados o especificados por Trimble; (ii) el manejo del Producto o Software fuera de las especificaciones normales, o adicionales a las mismas, de Trimble para sus productos; (iii) la modificación o utilización no autorizada del Producto o Software; (iv) el daño causado por rayos, otras descargas eléctricas o por inmersión en agua salada o dulce o pulverización; o (v) desgaste normal por el uso de las piezas no duraderas (por ejemplo, baterías).

LAS GARANTÍAS ANTERIORES DETERMINAN LA RESPONSABILIDAD TOTAL DE TRIMBLE Y EL CUMPLIMIENTO EXCLUSIVO DE LOS REMEDIOS DE LOS PRODUCTOS Y SOFTWARE. EXCEPTO LO INDICADO EXPRESAMENTE EN ESTE ACUERDO, TRIMBLE PROVEE LOS PRODUCTOS Y SOFTWARE TAL Y COMO ESTÁN, SIN GARANTÍA EXPRESA O IMPLÍCITA, EXCLUYENDO EXPRESAMENTE LAS GARANTÍAS DE COMERCIALIZACION Y AJUSTE IMPLÍCITAS PARA UN PROPÓSITO EN PARTICULAR. LAS GARANTÍAS EXPRESAS QUE SE INDICAN SON EN CAMBIO DE TODAS LAS OBLIGACIONES O RESPONSABILIDADES POR PARTE DE TRIMBLE QUE SURGEN O ESTÁN VINCULADAS A LOS PRODUCTOS O SOFTWARE. ALGUNOS ESTADOS Y JURISDICCIONES NO PERMITEN LIMITAR LA DURACIÓN DE UNA GARANTÍA IMPLÍCITA, POR LO QUE LA LIMITACIÓN ANTES MENCIONADA TAL VEZ NO LE SEA APLICABLE.

Limitación de responsabilidad

CON EL ALCANCE MÁXIMO QUE PERMITE LA LEY APLICABLE, TRIMBLE NO SERÁ RESPONSABLE DE LOS DAÑOS INDIRECTOS, ESPECIALES O CONSECUENTES DE NINGÚN TIPO O BAJO NINGUNA CIRCUNSTANCIA O TEORÍA LEGAL RELACIONADA CON LOS PRODUCTOS O SOFTWARE, SIN TENER EN CUENTA SI SE HA INFORMADO A TRIMBLE SOBRE LA POSIBILIDAD DE DICHA PÉRDIDA Y SIN CONSIDERAR EL DESARROLLO DE LA NEGOCIACION QUE TRANSCURRE O HA TRANSCURRIDO ENTRE USTED Y TRIMBLE. PUESTO QUE ALGUNOS ESTADOS Y JURISDICCIONES NO PERMITEN LA EXCLUSIÓN O LIMITACIÓN DE RESPONSABILIDAD POR DAÑOS CONSECUENTES O INCIDENTALES, LA LIMITACIÓN ANTES MENCIONADA TAL VEZ NO LE SEA APLICABLE.

EN TODO CASO, LA ÚNICA RESPONSABILIDAD DE TRIMBLE, Y EL ÚNICO REMEDIO POR INCUMPLIMIENTO DE ESTE ACUERDO, ESTARÁ LIMITADO AL REEMBOLSO DEL PRECIO DE COMPRA O TASA DE LICENCIA ABONADA POR LOS PRODUCTOS O POR EL SOFTWARE.


Bienvenido a la Ayuda de Trimble Geomatics Office™.

Esta Ayuda está diseñada para suministrar la información necesaria para usar, de forma efectiva, toda la capacidad y el potencial del software Trimble Geomatics Office. La misma describe cómo instalar y usar Trimble Geomatics Office.

  Uso de la Ayuda

  Trimble Geomatics Office – Visión de conjunto

  Acerca de Trimble

  Comentarios


Comando Nueva ventana

Utilice este comando para abrir otra ventana para el proyecto actual.

Para acceder al mismo, seleccione Ventana / Nueva ventana.

Cada una de las ventanas nuevas se añade a la lista de ventanas del menú Ventana.

La ventana nueva tiene el mismo contenido que la ventana activa. Usted puede abrir ventanas múltiples con el fin de mostrar partes o vistas diferentes del proyecto a la vez. Por ejemplo, puede abrir ventanas diferentes y mostrar una capa distinta del proyecto en cada ventana.

Si se cambia el contenido de una ventana del proyecto, todas las demás ventanas del proyecto que visualicen esa información, reflejarán las modificaciones efectuadas en la primera ventana.

Cuando abra una nueva ventana, ésta se convierte en la ventana activa y se visualiza encima de todas las otras ventanas abiertas.


Comando Cascada

Utilice este comando para superponer múltiples ventanas abiertas del proyecto.

Para acceder al mismo, seleccione Ventana / Cascada.

Las ventanas se superponen de forma que usted puede ver el título de cada una de ellas.


Comando Mosaico

Utilice este comando para reordenar todas las ventanas del proyecto actualmente abiertas.

Para acceder al mismo, seleccione Ventana / Mosaico.

Las ventanas se ordenan en forma de mosaico.


Comando Organizar iconos

Utilice este comando para reorganizar los iconos de ventanas minimizadas, de forma ordenada, en la pantalla.

Para acceder al mismo, seleccione Ventana / Organizar iconos.

Los iconos se colocan en la parte inferior de la ventana.


Comando Dividir

Utilice este comando para ver las dos partes de un proyecto a la vez.

Para acceder al mismo, seleccione Ventana / Dividir

La división de la ventana puede cambiarse de tamaño haciendo clic y arrastrando la barra de división. Las modificaciones efectuadas en una zona, se producen simultáneamente en la otra.


Comando Lista de presentación

Utilice este comando para abrir una ventana en la lista de presentación. La lista muestra todas las ventanas abiertas.

Para acceder a ella, seleccione del menú Lista de presentación de ventanas.


Sitio en World Wide Web

Para echar un vistazo interactivo a Trimble, visite nuestro sitio en la World Wide Web
(http://www.trimble.com/)


Ventana Propiedades - Visión de conjunto
Ventana Propiedades − Visión de conjunto

La ventana Propiedades le permite ver la información acerca de todas las propiedades (puntos, observaciones, líneas, arcos, curvas, texto, anotaciones, notas).

Utilice la ventana Propiedades para ver y editar las propiedades de una entidad seleccionada. Sólo podrá ver las propiedades de una entidad cada vez. Se aplicarán los cambios realizados en la ventana Propiedades de inmediato.

El tamaño de la ventana Propiedades se puede ajustar haciendo clic y arrastrando el marco de la misma. Haga clic en el botón superior derecho para cerrarla.

Puede mantener la ventana Propiedades abierta mientras utiliza otras partes de Trimble Geomatics Office. La ventana Propiedades se actualiza automáticamente para mostrar la información correcta acerca del conjunto de selección.

Si ha definido un conjunto de selección actual y selecciona una entidad para verla en la lista de selección de la ventana Propiedades, la selección actual en la ventana gráfica se actualiza para incluir sólo la entidad que está viendo. La lista de selección de la ventana Propiedades retiene el conjunto de selección actual. Las entidades resaltadas en la lista de selección de la ventana Propiedades se convertirán en el conjunto de selección actual en la ventana gráfica.

La vista arbórea en la ventana Propiedades muestra los nombres y valores de los elementos seleccionados en la pantalla. La vista arbórea muestra la relación entre las entidades. Por ejemplo, usted puede ver el punto inicial “de” o final “a” para cualquier observación o entidad de tipo de línea haciendo clic en el signo (+) y seleccionando el punto que desea ver y editar.

La vista se puede contraer o expandir en los nodos:

  Haga clic en el signo (+) para expandir la vista arbórea.

  Haga clic en el signo (–) para contraer la vista arbórea.

La información y las fichas disponibles en el lado derecho de la ventana Propiedades dependen del tipo de entidad actualmente seleccionado.

Herramientas de selección en la ventana Propiedades

Las herramientas de selección en la ventana Propiedades le permiten configurar el conjunto de selección.

Selección	Icono	Haga clic en este botón para ...
Agrupar datos topográficos		agrupar los datos topográficos por fuente, tipo de dato o dirección de la observación.
Ordenar		ordenar las entidades en la lista de selección. Seleccione la opción que desea en la lista. Podrá optar por ordenar puntos por el orden en la base de datos, la elevación, el nombre, la calidad, la hora de inicio, la longitud de ocupación o el tipo de dato.
Filtrar		conservar solamente puntos, observaciones, observaciones indicadas o el conjunto de selección actual. También podrá quitar la selección actual. NOTA: Podrá añadir sus propias consultas a la lista de filtros.
Indicadores de calidad

Los Indicadores de calidad son pequeños símbolos que aparecen a la derecha de cada campo en la página Resumen. Estos símbolos muestran la calidad de los datos topográficos. La calidad puede ser de control fijo, de control, topográfica, cartográfica, desconocida o ajustada. Los indicadores de calidad también se utilizan en el Informe de derivación de puntos y el Informe de recálculo.

Indicadores geoidales

Los Indicadores geoidales muestran si el componente de elevación o de altura de un punto ha sido derivado del geoide definido para el proyecto. El indicador geoidal aparecerá con el indicador de calidad.

Por ejemplo, si mide un punto RTK, el mismo tendrá una altura WGS-84 y una elevación derivada del geoide. Si captura un punto terrestre, tendrá una elevación y una altura WGS-84 derivada del geoide.

Los indicadores geoidales también se utilizan en el Informe de derivación de puntos y en el Informe de recálculo.

La calidad geoidal del modelo geoidal se determina en la ficha Recalcular.

Herramienta Permitir minimización auto

Use esta herramienta [image] para minimizar la ventana Propiedades cuando está seleccionando las entidades en la ventana gráfica.

Bloquear ventana abierta

Use esta herramienta [image] para asegurarse de que cuando la ventana Propiedades está abierta permanezca con el mismo tamaño.


Ventana Propiedades - Ficha Levantamiento. - Visión de conjunto
Ventana Propiedades − Ficha Levantamiento. − Visión de conjunto

Utilice la ficha Levantamiento para ver y editar las propiedades relacionadas con el levantamiento de una entidad de la selección. Se pueden ver las propiedades de las entidades que aparecen en Vista de levantamiento, tales como:

  Puntos

  Observaciones GPS

  Observaciones convencionales

  Observaciones de nivel

  Observaciones de telémetros de láser

  Observaciones reducidas (distancias al eje)

Páginas

La información topográfica está organizada en páginas. Sólo puede verse una página por vez. Para acceder a las páginas se utilizan los botones de menú disponibles. Los botones de menú acceden a toda la información topográfica y dependen del tipo de la entidad actualmente seleccionada.

Eliminación de puntos y observaciones

Para eliminar un punto o una observación, utilice el botón Eliminar [image] en la ventana Propiedades. Si no se puede eliminar una observación de punto, el botón Eliminar no estará disponible.

NOTA: Una coordenada fija no se podrá eliminar. “Desfije” la coordenada antes de eliminarla.


Ventana Propiedades - Ficha Levantamiento - Puntos
Ventana Propiedades − Ficha Levantamiento – Puntos

 Visión de conjunto

Utilice la ficha Levantamiento en la ventana Propiedades para ver y editar la información relacionada con el levantamiento del punto seleccionado. La información topográfica está organizada en páginas.

Se podrá acceder a las siguientes páginas haciendo clic en el botón de menú correspondiente:

Resumen
Advertencia
Ocupaciones y configs
Estimación de error


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Puntos)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Puntos)

Más información

 Cómo

Utilice la página Resumen para ver la posición y calidades derivadas para el punto seleccionado en la ventana Propiedades.

Para acceder a esta página, desde la ventana Propiedades:

  En la ficha Levantamiento, haga clic en el botón de menú Resumen [image].

Nombre punto

Muestra el nombre de punto. Para cambiar el nombre, introduzca un valor en este campo.

Campos de coordenadas

Muestra la posición derivada del punto y las calidades asignadas a cada componente. Los campos de coordenadas que se muestran dependen de la opción de presentación definida.

Cuadrícula / Local / WGS-84

Seleccione la opción de presentación de las coordenadas del punto.

NOTA: Si la opción de presentación está configurada en WGS-84, los campos de coordenadas que se muestran dependerán de los valores que se configuran en Muestra WGS-84 como en la ficha Unidades y formato del diálogo Propiedades proyecto. Por ejemplo, si en el campo Muestra WGS-84 como se muestra L,L,A los campos de coordenadas en la página Resumen se presentan como Latitud, Longitud, Altura. Si en el campo Muestra WGS-84 como se indica X,Y,Z, los campos WGS-84 se visualizan como X, Y, Z.

Informe de derivación

Seleccione la herramienta Informe de derivación [image] para mostrar el Informe de derivación de puntos.

Añadir coordenada

Seleccione la herramienta Añadir coordenada [image] cuando quiere teclear una coordenada de cuadrícula, local o WGS-84 introducida en la oficina. (Sólo se tendrá que hacer cuando desea que el software use la coordenada introducida en la oficina en vez de las coordenadas derivadas de observaciones.) Dicha coordenada tendrá un origen tecleado.

Sólo se podrá tener una coordenada de cuadrícula/local y una coordenada WGS-84 introducida en la oficina asociada con un punto. Si ya existe una coordenada WGS-84 y una coordenada de cuadrícula o local, la herramienta Añadir coordenada no estará disponible.

NOTA: Al añadir una coordenada, los campos de componentes de coordenadas y la calidad serán nulos.  Para introducir la posición del punto actual y la calidad, seleccione la herramienta Insertar valor actual [image].


Ventana Propiedades - Ficha Levantamiento - Página Advertencia
Ventana Propiedades − Ficha Levantamiento − Página Advertencia

Utilice la página Advertencia para ver y suprimir los mensajes asociados con los indicadores de advertencia que aparecen sobre los puntos u observaciones en la Vista del levantamiento.

Para hacerlo:

1.	Utilice una de las siguientes alternativas:

 Haga doble clic en un punto u observación que tenga el indicador de advertencia que quiera ver.

 Haga doble clic en el icono del indicador de advertencia en la barra de estado para seleccionar todos los puntos con indicadores de advertencia.

Aparecerá la ventana Propiedades.

2.	Si tiene más de una entidad en la selección, seleccione la entidad que quiera ver.

3. 	Para acceder a la página Advertencia, haga clic en el botón de menú Advertencia [image].

Antes de exportar coordenadas hay que resolver o suprimir todos los indicadores de advertencia. Cuando un Cierre por fuera de tolerancia se resuelve inhabilitando una mala observación o renombrando el punto si la observación se refería a un punto físico diferente, el indicador de error desaparecerá.

La siguiente tabla describe los mensajes que pueden aparecer con los indicadores de advertencia:

Suprimir este mensaje

Seleccione esta casilla de verificación para suprimir el indicador de advertencia asociado con el punto u observación seleccionado si decide que el error es aceptable para el levantamiento. El indicador se torna blanco en la ventana Propiedades y desaparece de la ventana de gráficos.

NOTA: Si se suprimen todos los indicadores de advertencia, el icono de indicador en la barra de estado se torna blanco.

Si ha seleccionado un punto, entonces podrá seleccionar la herramienta Derivación de puntos [image] para ver el Informe de derivación de puntos si tiene un punto seleccionado.

Úselo para determinar cómo fue derivada la posición del punto y por qué ha ocurrido el error.


Ventana Propiedades - Ficha Levantamiento  - Páginas Ocupaciones y configs
Ventana Propiedades − Ficha Levantamiento  − Páginas Ocupaciones y configs

Utilice las páginas Ocupaciones y configs para ver y corregir los detalles de las ocupaciones GPS o de las configuraciones terrestres del punto u observación seleccionado en la ventana Propiedades.

Las siguientes ventanas estarán disponibles dependiendo del tipo de entidad seleccionado y del método de campo utilizado:

Para acceder a estas páginas, desde la ventana Propiedades:

1.	Seleccione la observación.

2.	Haga clic en el botón de menú Ocupaciones y configs [image].

NOTA: Si existen más de una ocupación o configuración para el punto aparecerá un menú abreviado. Seleccione la página que quiera ver. Mientras sostiene el ratón sobre las diferentes ocupaciones y configuraciones en el menú abreviado, los detalles se actualizan en la página.

Un punto puede tener más de una ocupación. Sin embargo, una observación sólo tendrá un “desde punto” y un “al punto”.


Ventana Propiedades - Ficha Levantamiento - Página Ocupación GPS
Ventana Propiedades − Ficha Levantamiento − Página Ocupación GPS

Utilice la página Ocupación GPS para ver y corregir los detalles de la ocupación GPS del punto seleccionado. El contenido de la página es el mismo si el punto fue utilizado como estación base o como posición móvil.

Para acceder a esta página, desde la ventana Propiedades:

1.	Seleccione la ficha Levantamiento.

2.	Use una de las siguientes alternativas:

 Si tiene seleccionado un punto, haga clic en el botón de menú Ocupaciones y configs [image].

NOTA: Si existen más de una ocupación o configuración para el punto aparecerá un menú abreviado. Seleccione la página que quiera ver.

 Si tiene seleccionada una observación GPS, haga clic en el botón de la página Ocupación base [image] para ver los detalles de la ocupación base; o haga clic en el botón Menú Ocupación móvil [image] para ver los detalles de la ocupación móvil.

Punto

Muestra el nombre del punto ocupado.

Hora

Muestra la longitud de tiempo de ocupación y la hora inicial de la ocupación.

NOTA: Durante la importación de datos, las horas inicial y final se convierten de hora GPS a UTC (Hora Universal Coordinada, de hecho la Hora Media de Greenwich). Las horas se presentan luego como horas locales empleando el huso horario definido en Microsoft Windows.

SUGERENCIA: Sitúe el puntero sobre el campo para mostrar una Información sobre herramientas para el tiempo de parada de la ocupación.

Detalles antena

El grupo Detalles antena contiene detalles de la antena GPS utilizada para la ocupación del punto observado.

Altura

Muestra la altura de la antena. Si la altura de la antena fue introducida incorrectamente durante la ocupación, use el teclado para introducir un valor a fin de cambiar este campo.

Tipo

Muestra el tipo de la antena conectada al receptor. Si el tipo de antena fue introducido incorrectamente durante la ocupación, seleccione en la lista un tipo de antena a fin de cambiar este campo.

Medido a

Muestra hasta donde se midió la altura de la antena. Si el método fue introducido incorrectamente durante la ocupación, seleccione en la lista una opción a fin de cambiar este campo.


Ventana Propiedades - Ficha Levantamiento - Página Config instrumento
Ventana Propiedades − Ficha Levantamiento − Página Config instrumento

Utilice la página Config instrumento para ver y corregir los detalles de configuración del instrumento convencional empleado para la observación.

Para acceder a esta página, desde la ventana Propiedades:

1.	Seleccione la ficha Levantamiento.

2.	Con un punto seleccionado, haga clic en el botón de menú Ocupaciones y configs [image].

NOTA: Si existen más de una ocupación o configuración para el punto aparece un menú abreviado. Seleccione la página Config instrumento que quiera ver. Todas las ocupaciones del punto, GPS y terrestres, se podrán ver en esta página.

Pto del instrumento

Muestra el nombre del punto desde el que se tomó la observación.

Altura instrumento

Muestra la altura del instrumento cuando se tomó la observación. Si la altura fue introducida incorrectamente durante la configuración, use el teclado para introducir un valor a fin de cambiar este campo.

Punto REF

Muestra el nombre del punto de referencia observado.

Acimut REF

Muestra el acimut calculado a la referencia observada.

NOTA: Si el punto de referencia tiene coordenadas, éstas se utilizan para determinar el acimut al punto de referencia. Si también existe un acimut tecleado, la calidad del mismo se comparará con este acimut calculado utilizando las coordenadas del punto de referencia y se usará el acimut con la calidad más alta.  Si la calidad del acimut calculado y del acimut tecleado es la misma, se empleará el acimut calculado.


Ventana Propiedades - Ficha Levantamiento - Página Config Objetivo (destino)
Ventana Propiedades − Ficha Levantamiento − Página Config Objetivo (destino)

Utilice la página Config. objetivo (destino) para ver y corregir los detalles de configuración del objetivo utilizado para la observación convencional.

Para acceder a esta página, desde la ventana Propiedades:

1.	En la ficha Levantamiento, seleccione la observación convencional

2.	Haga clic en el botón de menú Config. objetivo [image] para ver los detalles de configuración del objetivo.

Punto AD

Muestra el nombre del punto de la visual hacia adelante.

Altura destino

Muestra la altura destino cuando se tomó la observación de la visual hacia adelante. Si la altura fue introducida incorrectamente durante la configuración, use el teclado para introducir un valor a fin de cambiar este campo.

Constante prisma

Muestra la constante prisma del destino aplicada a la observación. Si la constante no fue introducida o fue introducida incorrectamente durante la configuración, use el teclado para introducir un valor a fin de cambiar este campo.

El campo puede mostrar ‘?’ puesto que ya se ha aplicado la constante de prisma a la observación en el archivo, y el archivo no especifica la constante. Si se ha cometido un error durante la configuración y la constante de prisma ha sido introducida incorrectamente, aplique la diferencia entre la constante de prisma introducida en el campo y la constante que se debería haber introducido. Por ejemplo, si ha introducido “20” en el campo y tendría que haber sido “5”, introduzca una corrección de “–15” en el campo correspondiente a la constante de prisma.


Ventana Propiedades - Ficha Levantamiento - Página Coordenadas GPS (CFA)
Ventana Propiedades − Ficha Levantamiento − Página Coordenadas GPS (CFA)

Utilice la página Coordenadas GPS (CFA) para ver una solución de posición GPS. Una solución de posición se puede obtener:

  del GPS diferencial

  del Sistema de Ampliación de Area Extendida (WAAS)

  del empleo de la tecla [image] en Trimble Survey Controller

  de posiciones autónomas

  de VRS – Wide Area RTK (fija y flotante)

Las soluciones de posición se mostrarán para un punto si son de calidad topográfica o cartográfica. Se podrá tener más de una solución de posición, pero estos valores no se podrán editar.

Para acceder a esta página, desde la ventana Propiedades:

1.	En la ventana de gráficos, haga doble clic en el punto que incluye una coordenada GPS (CFA).

2.	Amplíe el punto en el árbol de la ventana Propiedades.

3.	Seleccione C?soln en la estructura arbórea [image] , donde ¿ indica el número de coordenada.

Se mostrará la página Coordenada GPS (CFA).

Punto

Muestra el nombre de punto.

Latitud, Longitud, Altura

Muestra las coordenadas WGS-84 y las calidades de punto determinadas para el punto.

NOTA: La altura que se muestra es la altura del Centro de fase de antena de la antena GPS utilizada para la ocupación. No se aplicará la altura de la antena.

Tipo procesador

Muestra el método de procesamiento. Por ejemplo, WASS, Wide Area RTK .

Estado

Muestra el estado de la solución de posición. El estado se considera mediante recálculo, o cuando se realiza un cálculo topográfico. Para cambiar este campo haga clic en la flecha y seleccione la opción en la lista desplegable que desee que se aplique al punto.


Ventana Propiedades - Ficha Levantamiento - Página Coordenada
Ventana Propiedades − Ficha Levantamiento − Página Coordenada

Más información

 Véase también

Se podrá utilizar la página Coordenada para ver las coordenadas de un punto seleccionado. También puede usarse para cambiar las calidades y el estado de las coordenadas. Un punto podrá tener una coordenada WGS-84, una coordenada de cuadrícula/local y coordenadas ajustadas. Una coordenada ajustada puede ocurrir después de realizar un ajuste de la red (si tiene instalado el módulo Network Adjustment [Ajuste de la red]).

Utilice la página Resumen para ver las coordenadas del punto.

Para acceder a la página Coordenadas:

1.	En la ventana de gráficos, haga doble clic en el punto. Aparecerá la ventana Propiedades.

2.	Expanda el árbol del punto y seleccione la coordenada.

Se mostrarán las coordenadas del punto.

Campos de coordenadas

Muestra los valores de los componentes de las coordenadas del punto y las calidades asignadas a ellos. Los campos de coordenadas que se muestran dependen de la opción de presentación definida y sólo son editables si la vista actual es la misma que el tipo de coordenada guardada.

Cuadrícula / Local / WGS-84

Seleccione la opción de presentación de las coordenadas del punto.

NOTA: Si la opción de presentación está configurada en WGS-84, los campos de coordenadas que se muestran dependerán de los valores configurados en Muestra  WGS-84 como en la ficha Unidades y formato del diálogo Propiedades proyecto. Por ejemplo, si en el campo Muestra WGS-84 como está configurado en X,Y,Z, el campo de coordenadas en la página Resumen se presenta como X,Y,Z. Si en el campo Muestra WGS-84 como está configurado en L,L,A, los campos WGS-84 se etiquetan como Latitud, Longitud y Altura.

Control Selector de calidad

Utilice el control Selector de calidad para asignar una calidad al componente de la coordenada. Las calidades figuran en orden descendente:

  Control

  Topográfica

  Cartográfica

  Desconocida

Estado

Muestra el estado del punto seleccionado. El estado de un punto se considera mediante recálculo, o cuando se realiza un cálculo topográfico. Para cambiar este campo haga clic en la flecha y seleccione la opción en la lista desplegable que desee que se aplique al punto.

Inhabilite una coordenada si no desea utilizarla para derivar la posición del punto.

Habilite una coordenada como una comprobación si sólo quiere usar la coordenada si no hay otras observaciones o coordenadas que se pueden utilizar para derivar la posición del punto.

El Informe de recálculo informará las coordenadas habilitadas pero no las inhabilitadas.

Tipo de coordenada

Las coordenadas se guardan en la base de datos como el tipo de coordenada seleccionado. Si la coordenada se guarda como un tipo diferente, se sobrescribirán las coordenadas del mismo tipo existentes.


Ventana Propiedades - Ficha Levantamiento - Observaciones GPS
Ventana Propiedades − Ficha Levantamiento − Observaciones GPS

Usted puede ver la información sobre cualquier tipo de observación GPS tal como RTK, Estática, Estática rápida, y vectores cinemáticos con posprocesamiento.

Utilice la ficha Levantamiento en la ventana Propiedades para ver y editar la información relacionada con el levantamiento de la observación GPS seleccionada. La información topográfica está organizada en páginas.

Se podrá acceder a las siguientes páginas, haciendo clic en el botón de menú correspondiente:

Resumen
Advertencia
Ocupación base
Ocupación móvil
Observación
Estadísticas observación


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Observaciones GPS)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Observaciones GPS)

La página Resumen contiene un resumen de los detalles de la observación GPS seleccionada en la ventana Propiedades.

1.	Seleccione una observación GPS en la vista del levantamiento

2.	Para acceder a la misma, desde la ventana Propiedades, haga clic en el botón de menú Resumen [image].

De

Muestra el nombre del punto de referencia desde el que se hace la observación.

A

Muestra el nombre del punto móvil al que se hace la observación.

Hora

Muestra la longitud de tiempo de la ocupación y la hora inicial de la ocupación.

NOTA: Durante la importación de datos, las horas inicial y final se convierten de hora GPS a UTC (Hora Universal Coordinada, de hecho la Hora Media de Greenwich). Las horas se presentan luego como horas locales empleando el huso horario configurado en Microsoft Windows.

SUGERENCIA: Sitúe el puntero en el campo para mostrar una Información sobre herramientas para el tiempo de parada de la ocupación.

Tipo procesador

Muestra el tipo de procesador de la observación seleccionada. La clasificación se refiere al procesador utilizado para determinar la solución de la observación. El campo de tipo de procesador puede ser:

  RTK

  Estático o Estático rápido

  Cinemático PP

  Potencial : indica que la solución de la observación puede ser, pero no ha sido, determinada por el procesador de la línea base.

Método campo

Muestra el método de levantamiento GPS utilizado para la observación.

  Topo

  Continuo

 Control observado

  Rápido

 Estático o Estático rápido

  Evento

  Parar y seguir

Estado

Muestra el estado de la observación seleccionada. El estado de una observación es considerado por recálculo, o cuando se realiza un cálculo topográfico. Utilice este campo para inhabilitar observaciones malas (tal como cuando la observación produce un error de cierre).

Para cambiar este campo haga clic en la flecha y seleccione la opción en la lista desplegable que desee que se aplique a la observación.

Inhabilite una observación si no desea utilizarla para derivar la posición del punto.

Habilite una observación como una comprobación si sólo quiere usar la observación si no hay otras observaciones o coordenadas que se pueden utilizar para derivar la posición del punto.

El Informe de recálculo informará las observaciones habilitadas como comprobación pero no las inhabilitadas.

Usar en ajuste de la red

No verifique esta casilla si no quiere que la observación seleccionada se utilice en un ajuste de red (si tiene instalado el módulo Network Adjustment), pero que se use en el cálculo de la base de datos mediante un recálculo.

Si la observación no tiene información sobre covarianzas o sobre errores típicos, esta opción estará inhabilitada.

Si la observación está inhabilitada, dicha opción no estará disponible.


Ventana Propiedades - Ficha Levantamiento - Página Observación (Observaciones GPS)
Ventana Propiedades − Ficha Levantamiento − Página Observación (Observaciones GPS)

Utilice la página Observación para seleccionar la solución activa y ver los componentes de la línea base para la observación seleccionada.

1.	Seleccione la observación en la vista del levantamiento.

2.	Para acceder a la misma desde la ventana Propiedades, haga clic en el botón de menú Observación [image].

Solución activa

Muestra la solución activa de la base de datos. Si ha procesado la base de datos más de una vez (cuando está instalado el módulo Baseline Processing [Procesamiento de líneas base]) utilizando distintos estilos de procesamiento y ha optado por no sobrescribir las soluciones de líneas base duplicadas en el diálogo Procesamiento GPS, la línea base puede tener más de una solución. Sin embargo, la línea base sólo puede tener una solución activa. Esta es la solución que un recálculo y un ajuste de la red utilizarán.  Haga clic en la flecha y seleccione la mejor solución en la lista desplegable que quiera tener activa para la observación.

SUGERENCIA: Mantenga el puntero sobre las soluciones para mostrar una Información sobre herramientas de los resultados de la línea base.

Tipo de solución

Muestra el tipo de solución de la observación de la observación seleccionada.

IncX, IncY, IncZ

Muestra los valores de incremento de la línea base GPS referidos al sistema de coordenadas cartesianas WGS-84 cuando la opción de presentación se configura en XYZ.

Acimut anterior SN, Distancia elipsoide, Incremento altura

Muestra los componentes de la línea base GPS referidos al elipsoide local cuando la opción de presentación está configurada en Geodésico.

NOTA: Acimut anterior SN se refiere al acimut en sección normal (geodésico) en el sentido desde el punto de referencia al punto móvil.

IncN, IncE, IncH (IncA)

Muestra los valores de incremento Norte, Este y Arriba del horizonte geodésico local cuando la opción de presentación se define como NEA.

Mostrar detalles terreno a terreno

Seleccione esta casilla de verificación para mostrar los valores de los componentes de la línea base reducidos a la alturas sobre el terreno de las marcas ocupadas por los receptores en los puntos de referencia y móviles.

Si la casilla de verificación no está habilitada, los valores de los componentes de la línea base se muestran desde el centro de fase de la antena de la referencia al centro de fase de la antena del móvil. La figura siguiente muestra esta diferencia.


Ventana Propiedades - Ficha Levantamiento - Página Observación (Solución de posición)

Use la página Observación para seleccionar la solución activa y ver los componentes de línea base para la observación seleccionada:

1.	Seleccione la línea base en la Vista del levantamiento.

2.	Para acceder a la misma, en la ventana Propiedades, haga clic en el botón de menú Observación [image].

Tipo procesador

Muestra el método de procesamiento. Por ejemplo, WAAS o wide-area RTK.

Método campo

Muestra el método de campo utilizado, por ejemplo, continuo.

Tipo de solución

Muestra el tipo de solución de observación de la observación seleccionada, por ejemplo, L1 flotante.


Ventana Propiedades - Ficha Levantamiento - Página Estadísticas observación (Observaciones GPS)
Ventana Propiedades − Ficha Levantamiento − Página Estadísticas observación (Observaciones GPS)

La página Estadísticas observación muestra las estadísticas de la solución y los indicadores de calidad apropiados dependiendo del tipo de observación de la línea base. Las estadísticas para una observación RTK son diferentes de las estadísticas para una observación estática/con posprocesamiento.

Utilice esta página para verificar la calidad de la solución.

1.	Seleccione la línea base en la vista del levantamiento.

2.	Para acceder a la misma, en la ventana Propiedades, haga clic en el botón de menú Estadísticas observación [image].

Si está viendo una observación RTK, aparecerán en la página Estadísticas observación los siguientes campos:

No de mediciones

Muestra el número de mediciones (épocas) tomadas para completar la observación.

Número mínimo de satélites

Muestra el número mínimo de satélites rastreados por los receptores de referencia y móvil durante la observación.

RMS

Muestra el Error medio cuadrático (RMS). El valor RMS muestra la precisión de las mediciones utilizadas para determinar la solución de línea base.

Distancia inclinada

Muestra la distancia inclinada de la observación.

Precisión horizontal

Muestra la precisión horizontal de las mediciones utilizadas para determinar la solución de la observación.

Precisión vertical

Muestra la precisión vertical de las mediciones utilizadas para determinar la solución de la observación.

PDOP/RDOP

Muestra el valor de Dilución de precisión de la posición (PDOP) para las líneas base cinemáticas, o el valor Dilución de precisión relativa (RDOP) para líneas base estáticas. La RDOP disminuye con el tiempo.

Si está viendo una línea base con posprocesamiento, aparecerán los siguientes campos en la página Estadísticas observación:

Razón

Muestra la razón de dos varianzas generadas en la búsqueda del entero que mejor se adapta a las mediciones.

Varianza de referencia

Muestra la varianza de referencias. La varianza de referencias es un indicador de cómo se ajustan los datos observados para la línea base en la solución calculada.

RMS

Muestra el Error medio cuadrático. El valor RMS expresa la precisión de las mediciones utilizadas para determinar la solución de la línea base.

Distancia inclinada

Muestra la distancia inclinada determinada de la observación.

Precisión horizontal

Muestra la precisión horizontal de las mediciones utilizadas para determinar la solución de la observación.

Precisión vertical

Muestra la precisión vertical de las mediciones utilizadas para determinar la solución de la observación.

RDOP

Muestra el valor de Dilución de precisión relativa.


Ventana Propiedades - Ficha Levantamiento - Página Estadísticas observación (Solución de posición)

La página Estadísticas observación muestra las estadísticas de solución adecuadas y el tipo de indicador de calidad.

Utilice esta página para verificar la calidad de la solución.

1.	Seleccione la línea base en la vista del levantamiento.

2.	Para acceder a la misma, en la ventana Propiedades, haga clic en el botón de menú Estadísticas observación [image].

Si está viendo una observación RTK, aparecerán en la página Estadísticas observación los siguientes campos:

Precisión horizontal

Muestra la precisión horizontal de las mediciones utilizadas para determinar la solución de la posición.

Precisión vertical

Muestra la precisión vertical de las mediciones utilizadas para determinar la solución de la posición.

RMS

Muestra el Error medio cuadrático. El valor RMS expresa la precisión de las mediciones utilizadas para determinar la solución de la línea base.

PDOP

Muestra el valor de Dilución de precisión de la posición (PDOP) para las líneas base

Número mínimo de satélites

Muestra el número mínimo de satélites rastreados durante la observación.

Número de posiciones GPS

Muestra el número de posiciones GPS utilizadas en la solución.


Ventana Propiedades - Ficha Levantamiento - Observaciones convencionales
Ventana Propiedades − Ficha Levantamiento − Observaciones convencionales

Cualquier observación terrestre medida en el campo puede verse mediante un instrumento convencional tal como una estación total o un teodolito.

Utilice la ficha Levantamiento en la ventana Propiedades para ver la información relacionada con el levantamiento de la observación convencional seleccionada y editar los detalles de configuración. La información topográfica está organizada en páginas.

Podrá acceder a las siguientes páginas, haciendo clic en el botón de menú correspondiente:

Resumen
Config. objetivo
Observación
Estadísticas observación

NOTA: Se mostrará una observación convencional en la estructura arbórea en el siguiente orden: nombre del punto de referencia, nombre del punto del instrumento, nombre del punto de visual hacia adelante.


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Observaciones convencionales)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Observaciones convencionales)

La página Resumen contiene un resumen de los detalles de la observación convencional seleccionada en la ventana Propiedades.

1.	Seleccione la observación en la vista del levantamiento.

2.	Para acceder a la misma, desde la ventana Propiedades, haga clic en el botón de menú Resumen [image].

Pto del instrumento

Muestra el nombre del punto utilizado para la configuración del instrumento desde el que se hace la observación.

Altura instrumento

Muestra la altura del instrumento.

Punto visual hacia referencia

Muestra el nombre del punto utilizado como la visual hacia la referencia.

Punto visual hacia delante

Muestra el nombre del punto de destino al que se ha realizado la observación.

Estado

Muestra el estado de la observación seleccionada. El estado de una observación se considera por recálculo, o cuando se realiza un cálculo topográfico.

Para cambiar este campo haga clic en la flecha y en la lista desplegable seleccione la opción que desea que se aplique a la observación.

Inhabilite una observación si no desea utilizarla para derivar la posición del punto.

Si la observación es una comprobación en un punto de referencia, habilite la observación como una comprobación. Ello asegurará que se informe un cierre pero la observación no se usará para determinar la coordenada.

El Informe de recálculo informará las observaciones habilitadas como comprobación pero no las inhabilitadas.

Usar en ajuste de la red

Si no quiere que la observación seleccionada se utilice en un ajuste de la red (si tiene instalado el módulo Network Adjustment), pero aún desea utilizarla en un recálculo, inhabilite esta casilla de verificación.


Ventana Propiedades - Ficha Levantamiento - Página Observación (Observaciones convencionales)
Ventana Propiedades − Ficha Levantamiento − Página Observación (Observaciones convencionales)

Utilice la página Observación para ver los componentes de la observación entre las configuraciones del instrumento y del objetivo para la observación seleccionada.

1.	Seleccione la observación en la vista del levantamiento.

2.	Para acceder a la misma, desde la ventana Propiedades, haga clic en el botón de menú Observación [image].

Acimut referencia

Muestra el acimut calculado y la calidad entre el punto del instrumento y el punto de la visual a la referencia.

NOTA: Si el punto de la visual hacia la referencia tiene coordenadas, éstas se utilizarán para determinar el acimut al punto de referencia. Si también existe un acimut tecleado, la calidad de este acimut tecleado se comparará utilizando las coordenadas del punto de la visual hacia la referencia y se empleará el acimut con la calidad más alta.  Si la calidad del acimut calculado y el acimut tecleado es la misma, se usará el acimut calculado.

Angulo horizontal, Angulo vertical, Distancia inclinada

Presenta los valores observados de los componentes de la observación cuando la opción de presentación está configurada en AH,AV,DI.

Acimut, Distancia horizontal, Incremento elevación

Presenta los valores observados de los componentes de la observación reducidos al sistema de coordenadas de cuadrícula cuando la opción de presentación está configurada en AC,DH,DV.

NOTA: Durante una importación se aplican las correcciones atmosféricas y las correcciones por curvatura y refracción a la observación. La observación horizontal se reduce a un ángulo desde el punto de referencia. El ángulo vertical se corrige para la curvatura y la refracción. La corrección PPM se aplica a la distancia inclinada.

Tipo de observación

Muestra la cara (uno, dos) del instrumento utilizada cuando se tomó la observación o si se ha realizado la media de las observaciones de la cara uno y la cara dos. Una observación media consiste en la media del par cara uno/cara dos, observado entre el punto de referencia y el punto observado durante la misma configuración.

La observación también puede derivarse de un ángulo de vuelta medio de Trimble Survey Controller (por ejemplo, cuando se observan ciclos).

Mostrar detalles terreno a terreno

Seleccione esta casilla de verificación para mostrar las observaciones reducidas a las alturas del terreno de las marcas ocupadas por el punto del instrumento y el punto de la visual hacia adelante.


Ventana Propiedades - Ficha Levantamiento - Observaciones de nivel
Ventana Propiedades − Ficha Levantamiento − Observaciones de nivel

Se podrá ver la información de las observaciones de nivel medidas en el campo. Para ver la información topográfica de una observación de nivel seleccionada, use la ficha Levantamiento en la ventana Propiedades.

La información en la ficha Levantamiento está organizada en páginas. Para acceder a una página, haga clic en el botón de menú correspondiente, según se muestra a continuación:

Resumen
Estadísticas observación.

NOTA: Si tiene intenciones de realizar un ajuste de la red utilizando datos de observaciones de nivel, deberá tener errores típicos definidos para las observaciones de nivel. Los errores típicos se calcularán en los siguientes casos:

  Si importa datos de nivel digital, el error típico se calculará empleando el número de vueltas y el error al leer las cosas en el diálogo Editar estilo de ajuste (ficha Observaciones terrestres).

  Cuando se importan datos de nivel con el formato Trimble Data Exchange. Si se incluye el número de vueltas en el formato Trimble Data Exchange, se calculará el error típico del Incremento elevación, basándose en la cantidad de vueltas.  Si incluye el valor del error típico del Incremento elevación en el formato Trimble Data Exchange, se utilizará este valor.

Si no se define ni calcula un error típico, las observaciones de nivel no estarán disponibles para el ajuste.

Se podrá introducir el error típico para cada observación en la ventana Propiedades.


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Observaciones de nivel)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Observaciones de nivel)

La página Resumen en la ventana Propiedades resume los detalles de observación de una observación de nivel seleccionada.

1.	Seleccione la observación de nivel

2.	Para acceder a la página, en la ventana Propiedades, haga clic en el botón de menú Resumen [image].

Desde punto

Muestra el nombre del punto desde el que se ha iniciado la serie de nivel.

Al punto

Muestra el nombre del punto en el que ha finalizado la serie de nivel.

Incremento elevación

Muestra el cambio en la elevación entre el punto “desde” y el punto “a”.

Estado

En esta lista, seleccione el estado que quiere para la observación. Dicho estado se considera durante los recálculos, o los cálculos topográficos.

Si la observación es una comprobación en un punto, habilite la observación como una comprobación. Ello asegurará la presentación de un cierre pero la observación no se utilizará para determinar la elevación. Si no desea que la observación empleada determine la posición del punto, inhabilítela.

El Informe de recálculo muestra observaciones de nivel habilitadas como comprobación, pero no muestra las observaciones inhabilitadas.


Ventana Propiedades - Ficha Levantamiento - Página Estadísticas observación (Observaciones de nivel)
Ventana Propiedades − Ficha Levantamiento − Página Estadísticas observación (Observaciones de nivel)

La página Estadísticas observación muestran las estadísticas correspondientes y los indicadores de calidad

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Levantamiento, haga clic en el botón de menú Estadísticas observación [image].

Error típico (Incremento elev)

Este valor muestra el error típico del Incremento elevación. El error se calcula cuando:

  se importan archivos de nivel digital (el error típico del Incremento elevación se calcula basándose en el número de vueltas y errores al leer el jalón de nivel).

  importar datos de nivel con el formato Trimble Data Exchange. Si se incluye el número de vueltas en el formato Trimble Data Exchange, el error típico del Incremento elevación se calculará basándose en el número de vueltas.  Si se incluye el error típico del Incremento elevación en el formato Trimble Data Exchange, se utilizará dicho valor.

También podrá introducir su propio error típico.

Número de vueltas

Este es el número de configuraciones del instrumento que se ha tomado para determinar el incremento de elevación entre los dos puntos.

Longitud de línea

Esta es la longitud del módulo de nivel. Se calcula al añadir la distancias de la visual de referencia y de la visual hacia adelante.


Ventana Propiedades - Ficha Levantamiento - Observaciones de telémetros de láser
Ventana Propiedades − Ficha Levantamiento − Observaciones de telémetros de láser

La información completa sobre cualquier observación terrestre medida en el campo puede verse mediante un telémetro de láser.

Utilice la ficha Levantamiento en la ventana Propiedades para ver la información relacionada con el levantamiento de la observación de telémetro de láser seleccionada. La información topográfica está organizada en páginas.

Podrá acceder a las siguientes páginas haciendo clic en el botón de menú correspondiente:

Resumen
Observación


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Observaciones de telémetros de láser)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Observaciones de telémetros de láser)

La página Resumen contiene un resumen de los detalles de observación de la observación de telémetro de láser seleccionada en la ventana Propiedades.

Para acceder a esta página, desde la ventana Propiedades :

  En la ficha Levantamiento, haga clic en el botón de menú Resumen [image].

Pto del instrumento

Muestra el punto desde el que se hace la observación de telémetro de láser.

Altura instrumento

Muestra la altura del instrumento.

Punto destino

Muestra el punto al que se ha realizado la observación del telémetro de láser.

Altura destino

Muestra la altura del destino.

Estado

Muestra el estado de la observación seleccionada. El estado de una observación es considerado por recálculo, o cuando se realiza un cálculo topográfico. Para cambiar este campo haga clic en la flecha y seleccione la opción que desea que se aplique a la observación en la lista desplegable.

Inhabilite una observación si no desea usarla para derivar la posición del punto.

Habilite una observación como una comprobación sólo si desea usar la observación si no hay otras observaciones o coordenadas que se pueden utilizar para derivar la posición del punto.

El Informe de recálculo informará observaciones habilitadas como comprobación pero no las inhabilitadas.


Ventana Propiedades - Ficha Levantamiento - Página Observación (Observaciones de telémetros de láser)
Ventana Propiedades − Ficha Levantamiento − Página Observación (Observaciones de telémetros de láser)

Utilice la página Observación para ver los componentes de la observación y editar la declinación magnética entre las configuraciones del instrumento y del destino para la observación seleccionada.

Para acceder a esta página, desde la ventana Propiedades :

  En la ficha Levantamiento, haga clic en el botón de menú Observación

Acimut magnético

Muestra el acimut magnético observado de la observación.

Declinación

Muestra la declinación magnética entre el Norte magnético y el Norte verdadero. Este valor se necesita para calcular acimut verdadero. Utilice el teclado para introducir un valor para cambiar este campo.

Angulo vertical

Muestra el ángulo vertical medido cuando se tomó la observación. Si este valor es nulo se supone que la distancia es horizontal.

Distancia inclinada

Muestra la distancia inclinada de la observación.


Ventana Propiedades - Ficha Nota
Ventana Propiedades − Ficha Nota

 Visión de conjunto

Los registros de notas son entidades no gráficas en la base de datos. Esto significa que no pueden ser seleccionadas en la ventana de gráficos.

Utilice la ficha Nota en la ventana Propiedades para ver y editar los registros de notas en el caso de que haya importado un trabajo que contenga notas introducidas por el usuario de Trimble Survey Controller.

Para acceder a esta ficha:

1.	Use una de las siguientes alternativas:

  Seleccionar / Conjuntos de selección. Elija el archivo .dc que contiene las notas que quiere ver.

  Elija Seleccionar / Por consulta / Notas.

2.	Abra la ventana Propiedades.

La ventana Propiedades muestra todas las entidades de notas con un icono que representa un lápiz [image].


Ventana Propiedades - Ficha CAD (Puntos)
Ventana Propiedades − Ficha CAD (Puntos)

Utilice la ficha CAD en la ventana Propiedades para ver y editar la información relacionada con CAD del punto seleccionado.

Capa

Muestra la capa a la que está asignado el punto seleccionado. Para cambiar este campo seleccione una capa de la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de punto

Vea o seleccione en la lista el estilo del punto.

Código característica

Vea o introduzca el valor del código de característica para el punto seleccionado.

Descripción

Vea o introduzca la Descripción para el punto seleccionado.


Ventana Propiedades - Ficha Línea
Ventana Propiedades − Ficha Línea

Utilice la ficha Líneas para ver y editar los campos de la entidad de línea seleccionada.

Para acceder a la misma desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad de línea.

  Seleccione la entidad de línea en la ventana de gráficos y abra la ventana Propiedades.

De

Muestra el nombre del punto inicial “de” de la línea seleccionada. Para cambiar este campo use el teclado.

A

Muestra el nombre del punto final “a” de la línea seleccionada. Para cambiar este campo use el teclado.

Acimut

Muestra el acimut entre el punto “desde” y “a”.

Distancia

Muestra la distancia entre el punto “desde” y “a”.

Capa

Muestra la capa a la que está asignada la entidad de línea seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de línea

Muestra el estilo de línea de la línea seleccionada. Para cambiar este campo seleccione en la lista un estilo de línea.


Ventana Propiedades - Ficha Curva
Ventana Propiedades − Ficha Curva

Utilice la ficha Curva para ver y editar los campos de la entidad curva seleccionada.

Para acceder a la misma desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad de curva.

  Seleccione la entidad de curva en la ventana de gráficos y abra la ventana Propiedades.

De

Muestra el nombre del punto inicial “de” de la curva seleccionada. Para cambiar este campo use el teclado.

A

Muestra el nombre del punto final “a” de la curva seleccionada. Para cambiar este campo use el teclado.

Tangente entrada, Tangente salida

Muestra las tangentes de la curva seleccionada. Para cambiar estos campos use el teclado para introducir nuevos valores.

Suavizamiento

Define la anchura existente en la curva seleccionada. Para cambiar este campo introduzca un valor entre 0 y 1.

Capa

Muestra la capa a la que está asignada la entidad curva seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de línea

Muestra el estilo de línea de la curva seleccionada. Para cambiar este campo seleccione en la lista un estilo de línea.


Ventana Propiedades - Ficha Arco
Ventana Propiedades − Ficha Arco

Utilice la ficha Arco para ver y editar los campos del arco seleccionado.

Para acceder a ella desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad de arco.

  Seleccione la entidad de arco en la ventana de gráficos y abra la ventana Propiedades.

De

Muestra el nombre del punto inicial “de” del arco seleccionado. Para cambiar este campo use el teclado.

A

Muestra el nombre del punto final “a” del arco seleccionado. Para cambiar este campo use el teclado.

Centro

Muestra el nombre del punto “centro” del arco seleccionado. Para cambiar este campo use el teclado para introducir el nombre del punto.

Norte, Este

Muestra las coordenadas del punto centro del arco. Para cambiar estos campos use el teclado para introducir nuevos valores.

NOTA: En el caso de que se haya definido el punto centro del arco no se usan las coordenadas. Se usa en punto centro.

Capa

Muestra la capa a la que está asignada la entidad de arco seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de línea

Muestra el estilo de línea del arco seleccionado. Para cambiar este campo seleccione en la lista un estilo de línea.

El arco es de menos de 180 grados.

Esta casilla de verificación se selecciona por defecto. Inhabilite esta casilla de verificación para aplicar el ángulo de arco seleccionado para que sea de más de 180 grados.


Ventana Propiedades - Ficha Anotación punto
Ventana Propiedades − Ficha Anotación punto

Utilice la ficha Anotación punto para ver y editar los campos de la entidad de anotación seleccionada asignada a un punto.

Para acceder a ella desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad de anotación.

  Seleccione la entidad de anotación en la ventana de gráficos y abra la ventana Propiedades.

Punto

Muestra el nombre del punto al que está asignada la entidad de anotación seleccionada.

Expresión texto

Muestra la expresión de texto de la entidad de anotación seleccionada. La expresión de texto puede ser una definición de texto o un código de campo inserto en la plantilla de anotación. Para introducir un valor en este campo use el teclado.

Este, Norte

Muestra las coordenadas respecto a la posición ancla por defecto “línea base izquierda” de la entidad de anotación seleccionada. Use el teclado para introducir valores a fin de cambiar estos campos.

Orientación

Muestra la orientación de la entidad anotación. Para introducir un valor en este campo use el teclado.

Capa

Muestra la capa a la que está asignada la entidad de anotación seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de texto

Muestra el estilo de texto de la entidad de anotación seleccionado. Para cambiar este campo seleccione un estilo de texto en la lista.


Ventana Propiedades - Ficha Anotación línea
Ventana Propiedades − Ficha Anotación línea

Utilice la ficha Anotación línea para ver y editar los campos de la entidad de anotación seleccionada asignada a una entidad de línea.

Para acceder a la misma desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad anotación.

  Seleccione la entidad de anotación en la ventana de gráficos y abra la ventana Propiedades.

Línea

Muestra los nombres de los puntos utilizados para definir la línea a la que está asignada la entidad de anotación seleccionada.

Expresión texto

Muestra la expresión de texto de la entidad de anotación seleccionada. La expresión de texto puede ser una definición de texto o un código de campo insertado en la plantilla de anotación. Para introducir un valor en este campo use el teclado.

Este, Norte

Muestra las coordenadas respecto a la posición ancla por defecto “línea base izquierda” de la entidad de anotación seleccionada. Para introducir valores a fin de cambiar estos campos use el teclado.

Orientación

Muestra la orientación de la entidad de anotación. Para introducir un valor en este campo use el teclado.

Capa

Muestra la capa a la que está asignada la entidad anotación de seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de texto

Muestra el estilo de texto de la entidad de anotación seleccionado. Para cambiar este campo seleccione un estilo de texto en la lista.


Ventana Propiedades - Ficha Anotación arco
Ventana Propiedades − Ficha Anotación arco

Utilice la ficha Anotación arco para ver y editar los campos de la entidad de anotación seleccionada asignada a una entidad de arco.

Para acceder a ella desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad de anotación.

  Seleccione la entidad de anotación en la ventana de gráficos y abra la ventana Propiedades.

Arco

Muestra los nombres de los puntos utilizados para definir el arco al que está asignada la entidad de anotación seleccionada.

Expresión texto

Muestra la expresión de texto de la entidad de anotación seleccionada. La expresión de texto puede ser una definición de texto o un código de campo insertado en la plantilla de anotación. Para introducir un valor use el teclado a fin de cambiar el campo.

Este, Norte

Muestra las coordenadas con respecto a la posición ancla por defecto “línea base izquierda” de la entidad de anotación seleccionada. Para introducir valores a fin de cambiar estos campos use el teclado.

Orientación

Muestra la orientación de la entidad de anotación. Para introducir un valor en este campo use el teclado.

Capa

Muestra la capa a la que está asignada la entidad de anotación seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de texto

Muestra el estilo de texto de la entidad de anotación seleccionada. Para cambiar este campo seleccione en la lista un estilo de texto.


Ventana Propiedades - Ficha Texto
Ventana Propiedades − Ficha Texto

Utilice la ficha Texto para ver y editar los campos de la entidad de texto seleccionada.

Para acceder a ella desde la Vista del plano use una de las siguientes alternativas:

  Haga doble clic en la entidad de texto.

  Seleccione la entidad de texto en la ventana de gráficos y abra la ventana Propiedades.

Expresión texto

Muestra la expresión de texto de la entidad de texto seleccionada. La expresión de texto puede ser una definición de texto o un código de campo insertado. Para introducir un valor en este campo use el teclado.

Este, Norte

Muestra las coordenadas con respecto al tipo ancla especificado de la entidad de  texto seleccionada. Para introducir valores a fin de cambiar estos campos use el teclado.

Orientación

Muestra la orientación de la entidad de texto. Para introducir un valor en este campo use el teclado.

Capa

Muestra la capa a la que está asignada la entidad de texto seleccionada. Para cambiar este campo seleccione una capa en la lista o use el teclado para introducir el nombre de una nueva capa.

Estilo de texto

Muestra el estilo de texto de la entidad de texto seleccionada. Para cambiar este campo seleccione en la lista un estilo de texto.


Ventana Propiedades - Ficha Atributos
Ventana Propiedades − Ficha Atributos

Utilice la ficha Atributos en la ventana Propiedades para administrar los atributos en su proyecto. La ventana Propiedades le permite ver, editar, añadir y eliminar atributos en Trimble Geomatics Office.

Para acceder a esta ficha, en la ventana Propiedades:

  Seleccione la ficha Atributos.

NOTA: Para que esté disponible la ficha Atributos, antes debe configurar el proyecto para atributos.

Herramienta Selección de atributo

La herramienta Selección de atributo muestra el atributo actual seleccionado para el punto. Si el punto tiene asociados más de un atributo, haga clic en la flecha y seleccione en la lista desplegable el atributo que quiere ver.

Nombre de atributo

Muestra los nombres de las propiedades de atributos seleccionadas que están asociadas con el punto seleccionado.

Valor

Muestra los valores de las propiedades de atributos seleccionadas que están asociadas con el punto seleccionado. Para editar el valor de un atributo haga clic en el campo pertinente y seleccione un valor de la lista o, si no hay una lista de menú disponible, use el teclado para introducir un valor en el campo.


Ventana Propiedades - Ficha General
Ventana Propiedades − Ficha General

La ficha General de la ventana Propiedades se muestra cuando se abre la ventana Propiedades sin ninguna entidad seleccionada, o cuando en la lista de selección de la ventana Propiedades hay más de una entidad resaltada.

La ficha General muestra el mensaje “No hay propiedades disponibles”.

Para ver las propiedades de una entidad seleccione una entidad en la ventana de gráficos o en la lista de selección en la ventana Propiedades .


Ventana Propiedades - Ficha Levantamiento - Observaciones reducidas
Ventana Propiedades − Ficha Levantamiento − Observaciones reducidas

Al utilizar Trimble Survey Controller, se puede ver la información completa sobre cualquier observación terrestre reducida, tal como la distancia al eje medida en el campo.

Utilice la ficha Levantamiento en la ventana Propiedades para ver y editar la información relacionada con el levantamiento de la observación seleccionada. La información topográfica está organizada en páginas.

Para acceder a una página en la ficha Levantamiento, haga clic en un botón de menú. Se podrá acceder a las siguientes páginas:

Resumen
Observación


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Observaciones reducidas)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Observaciones reducidas)

La página Resumen contiene un resumen de los detalles de la observación reducida seleccionada en la ventana Propiedades.

Para acceder a esta página, desde la ventana Propiedades:

  En la ficha Levantamiento, haga clic en el botón de página Resumen

De

Muestra el nombre del punto desde el que se hace la observación.

A

Muestra el nombre del punto al que se hace la observación.

Estado

Muestra el estado de la observación de distancia al eje seleccionada. El estado de una observación es considerado por recálculo, o cuando se realiza un cálculo topográfico. Para cambiar este campo haga clic en la flecha y seleccione la opción en la lista desplegable que desea que se aplique a la observación.


Ventana Propiedades - Ficha Levantamiento - Página Observación (Observaciones reducidas)
Ventana Propiedades − Ficha Levantamiento − Página Observación (Observaciones reducidas)

Utilice la página Observación para ver los componentes de la observación reducida.

Para acceder a esta página, desde la ventana Propiedades:

  En la ficha Levantamiento, haga clic en el botón de menú Observación [image].

Acimut

Muestra el acimut observado de la observación

Distancia horizontal

Muestra la distancia horizontal medida de la observación.

Distancia vertical

Muestra la distancia vertical medida de la observación.


Coordenadas - Visión de conjunto
Coordenadas − Visión de conjunto

Más información

 Véase también

Cuando se introducen coordenadas conocidas para un punto en un proyecto de Trimble Geomatics Office, una coordenada se guardará con otros datos topográficos para el punto. Cada punto tiene un máximo de una coordenada WGS-84 introducida por el usuario y una coordenada de cuadrícula/local introducida por el usuario.

Si se edita una coordenada introducida por el usuario ya existente, la coordenada antigua se sustituye por la nueva.

Se pueden introducir coordenadas para puntos existentes utilizando:

  ventana Propiedades / botón Añadir nueva coordenada

  diálogo Puntos (si se tiene instalado el módulo Network Adjustment)

  la importación de un archivo con coordenadas para puntos que ya existen en la base de datos.

Se podrán introducir coordenadas para puntos nuevos con coordenadas tecleadas empleando:

  el diálogo Insertar puntos

  la importación un archivo con coordenadas para puntos que no existen todavía en la base de datos.

Todas las coordenadas introducidas en Trimble Geomatics Office se añaden como coordenadas subyacentes del punto y pueden verse en páginas de coordenadas separadas en la Ventana Propiedades .

NOTA: Para ver la posición del punto utilice la página Resumen. La coordenada introducida se usará para posicionar el punto si es de la misma calidad (o más alta) que las observaciones al punto.


Ventana Propiedades - Ficha Replanteo - Visión de conjunto
Ventana Propiedades − Ficha Replanteo − Visión de conjunto

La ficha Replanteo muestra información sobre puntos que han sido replanteados en el campo utilizando Trimble Survey Controller. Las siguientes página están disponibles en el ficha Replanteo:

  Incrementos recién replant.

  Detalles lineales

  Punto de captura

  Detalles de la estaca

  MDT


Ventana Propiedades - Ficha Replanteo - Página Incrementos recién replant.
Ventana Propiedades − Ficha Replanteo − Página Incrementos recién replant.

Use esta página para ver las diferencias entre la ubicación del punto de diseño y el punto replanteado.

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Replanteo, haga clic en el botón de menú Incrementos recién replant. .

Método

Este campo muestra el elemento replanteado. Por ejemplo, un punto, una línea, un arco o una carretera.

Si la opción Polar está seleccionada, se mostrarán los siguientes campos:

Acimut

Este campo muestra el acimut del punto de diseño al punto replanteado.

Longitud

Este campo muestra la distancia del punto de diseño al punto replanteado.

Si la opción Incrementos cuadrícula está seleccionada, se mostrarán los siguientes campos:

Incremento Norte

Este campo muestra la diferencia en el Norte entre el punto de diseño y el punto replanteado.

Incremento Este

Este campo muestra la diferencia en el Este entre el punto de diseño y el punto replanteado.

Si la opción Estación y d.eje está seleccionada, se mostrarán los siguientes campos.

Incremento estación

Este campo muestra la diferencia en distancia (paralela al eje del diseño) entre el punto de diseño y el punto replanteado.

Incremento d.eje

Este campo muestra la diferencia en distancia (en ángulo rectos al eje del diseño) entre el punto de diseño y el punto replanteado.

Incremento elevación

Este campo muestra la diferencia en elevación entre el punto de diseño (en el punto a replantear) y el punto replanteado.

Desmonte/Terraplén

Este campo muestra la diferencia en elevación entre el punto de diseño (en el punto que realmente tiene que replantearse) y el punto replanteado.

Los valores de incremento de elevación y de desmonte/terraplén serán los mismos a menos que:

  La superficie de diseño no es un plano horizontal, y

  Hay un error importante en el error horizontal al replantear el punto

La siguiente figura muestra la diferencia entre el incremento de elevación y el desmonte/terraplén cuando la superficie de diseño no es un plano horizontal.

Si el punto replanteado era un punto de captura, entonces los incrementos informados son de la posición replanteada al punto de captura calculado.


Ventana Propiedades - Ficha Replanteo - Detalles lineales
Ventana Propiedades − Ficha Replanteo − Detalles lineales

Use esta página para ver los detalles de replanteo de una característica lineal (por ejemplo, una línea, un arco o una carretera).

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Replanteo, haga clic en el botón de menú Detalles lineales [image].

Nombre

Este campo muestra el nombre de la característica lineal desde la que se replantea el punto.

Estación

Este campo muestra la estación de diseño del punto seleccionado para el replanteo.

D.eje horizontal

Este campo muestra la distancia al eje horizontal del diseño al punto replanteado. Para una carretera, este campo muestra la distancia la eje horizontal de construcción.

D.eje vertical

Este campo muestra la distancia al eje vertical del diseño al punto replanteado. Para una carretera, este campo muestra la distancia al eje vertical de construcción.

Si se ha replanteado una carretera, también se mostrarán los siguientes campos:

D.eje del diseño

Este campo muestra la distancia al eje del diseño del punto a replantear.

Elevación de diseño

Este campo muestra la elevación de diseño del punto a replantear.

Nombre característica

Este campo muestra el nombre de la característica.

Método d.eje horz

Este campo muestra la distancia al eje horizontal que se ha aplicado. La distancia al eje horizontal se podrá aplicar:

  horizontalmente

  en la pendiente del elemento de plantilla anterior


Ventana Propiedades - Ficha Replanteo - Punto de captura
Ventana Propiedades − Ficha Replanteo − Punto de captura

Use la página Punto de captura para ver los detalles sobre el punto de captura. Esta opción solamente está disponible cuando el punto replanteado era un punto de captura en una carretera.

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Replanteo, haga clic en el botón de menú Punto de captura [image].

El punto donde una superficie de diseño intersecta la superficie natural se conoce como el punto de captura.  El siguiente diagrama muestra la sección transversal típica de una carretera:

Donde:

A = Distancia al eje

B = Distancia horizontal del punto de captura al punto de unión

C = Distancia vertical del punto de captura al punto de unión

D = Pendiente transversal

E = Distancia inclinada al punto de unión

F = D.eje horizontal de construcción

G = Ancho de la cuneta de desmonte

H = Punto de unión

J = Punto de captura

Distancia inclinada

Este campo muestra el valor de la distancia inclinada.

Ancho cuneta desmonte

Este campo muestra el valor del ancho de la cuenta de desmonte. Se muestra como “G” en el diagrama anterior.

Tipo de talud lateral

Este campo muestra el tipo de talud lateral (por ejemplo, desmonte o terraplén).

Distancia horz al eje

Este campo muestra la distancia horizontal del punto de captura replanteado al eje.

Elevación

Este campo muestra la elevación recién replanteada del punto de captura.

Distancia horizontal a la unión

Este campo muestra la distancia horizontal del punto de captura a la unión.

Distancia vertical a la unión

Este campo muestra la distancia vertical del punto de captura a la unión.

Distancia inclinada a la unión

Este campo muestra la distancia inclinada del punto de captura a la unión.

Dist incl + d.eje construcción

Este campo muestra la distancia inclinada del punto replanteado al punto de unión. En el diagrama anterior, se muestra como la distancia inclinada del punto de unión “H” a un punto definido. Este punto está definido al proyectar el talud hasta que intersecta la posición replanteada. Este valor será nulo (?) si:

  no se aplica una distancia al eje horizontal de construcción

  la distancia al eje horizontal de construcción se aplica horizontalmente


Ventana Propiedades - Ficha Replanteo - Detalles de la estaca
Ventana Propiedades − Ficha Replanteo − Detalles de la estaca

Use esta página para ver las distancias del punto de captura a puntos en la plantilla.

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Replanteo, haga clic en el botón de menú Detalles de la estaca [image].

Nombre

Este campo muestra el nombre del punto en la plantilla.

Distancia horizontal del punto de captura

Este campo muestra la distancia horizontal del punto de captura al punto en la plantilla.

Distancia vertical del punto de captura

Este campo muestra la distancia vertical del punto de captura al punto en la plantilla.


Ventana Propiedades - Ficha Replanteo - MDT
Ventana Propiedades − Ficha Replanteo – MDT

Use esta página para ver los detalles de los puntos MDT replanteados.

Para acceder a al misma, desde la ventana Propiedades:

  En la ficha Replanteo, haga clic en el botón de menú MDT [image].

Nombre MDT

Este campo muestra el nombre del MDT.

D.eje vertical

Este campo muestra la distancia al eje vertical especificada entre el MDT y la superficie a replantear.

Desmonte/Terraplén

Este campo muestra la diferencia en elevación entre el MDT (incluyendo la distancia al eje vertical) y el punto replanteado.


Ventana Propiedades - Ficha Levantamiento - Observaciones de acimut
Ventana Propiedades − Ficha Levantamiento − Observaciones de acimut

Use la ficha Levantamiento en la ventana Propiedades para ver y editar observaciones de acimut. La información topográfica está organizada en páginas.

Se podrá acceder a una página haciendo clic en el botón de menú correspondiente, según se muestra a continuación:

Resumen
Advertencia
Estadísticas observación


Ventana Propiedades - Ficha Levantamiento - Página Resumen (Observaciones de acimut)
Ventana Propiedades − Ficha Levantamiento − Página Resumen (Observaciones de acimut)

La página Resumen resume los detalles de observación del acimut seleccionado en la ventana Propiedades.

1.	Seleccione la observación de acimut en la vista del levantamiento

2.	Para acceder a la misma, desde la ventana Propiedades, haga clic en el botón de menú Resumen [image].

NOTA: A las observaciones de acimut se les asigna el prefijo AC.

Desde punto

Muestra el nombre del punto de referencia desde el que se hace la observación.

Al punto

Muestra el nombre del punto al que se hace la observación de acimut.

Acimut

Este campo muestra el acimut entre los puntos “de” y “a”. Se podrá mostrar un acimut anterior de sección normal o de cuadrícula. Este campo solamente es editable cuando los campos Tipo de acimut y Vista acimut son iguales.

Calidad

Esto muestra la calidad de la observación de acimut.

Tipo de acimut

Este grupo muestra si el acimut está almacenado en la base de datos como un acimut anterior de sección normal o de cuadrícula. Este campo no se podrá editar.

NOTA: Si el punto “a” no tiene un acimut, la conversión entre el Acimut cuadrícula y el Acimut ant sección normal no se podrá calcular. En este caso, el Acimut se mostrará como Nulo (?).

Vista acimut

Use estas opciones de visualización para seleccionar cómo se mostrará el acimut en la ventana Propiedades:

  Cuadrícula – seleccione esta opción para mostrar el Acimut cuadrícula.

  Ant sección normal – seleccione esta opción para mostrar el Acimut ant sección normal

NOTA: Si quiere editar el campo Acimut, la información en el campo Tipo de acimut y estas opciones de vista deberá ser la misma.

Estado

En esta lista, seleccione el estado que quiere que tenga la observación. Este estado se considera durante el recálculo, o durante el recálculo topográfico.

Si sólo desea que una observación se utilice para determinar la posición de un punto si no hay otras observaciones o coordenadas disponibles, habilite la observación como una comprobación. Inhabilite la observación si no quiere que la misma se emplee para determinar la posición del punto (por ejemplo, si la observación produce un error de cierre).

El Informe de recálculo muestra observaciones habilitadas como comprobación, pero no observaciones inhabilitadas.

Usar en ajuste de la red

Inhabilite esta casilla de verificación si no quiere que la observación seleccionada se utilice en un ajuste de la red (si tiene instalado el módulo Network Adjustment), pero que se use todavía cuando se recalcula la base de datos.


Ventana Propiedades - Ficha Levantamiento - Página Estadísticas observación (Observaciones de acimut)
Ventana Propiedades − Ficha Levantamiento − Página Estadísticas observación (Observaciones de acimut)

Esta página muestra las estadísticas de solución adecuadas y los indicadores de calidad, según el tipo de observación seleccionado. Para una observación de acimut, se mostrará el error típico. Use esta página para comprobar la calidad de la solución.

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Levantamiento, haga clic en el botón de menú Estadísticas observación [image].

Error típico

Use este campo para introducir el error típico de la observación de acimut.

NOTA: Un error típico de 0°00’00” fijará el acimut en el ajuste.


Coordenadas en la ventana Propiedades

Trimble Geomatics Office le permite añadir coordenadas añadir coordenadas para un punto en la ventana Propiedades, usando el botón Añadir coordenada [image]. Al hacer clic en este botón, aparecerá un menú abreviado. En este menú, seleccione el tipo de coordenada que quiere añadir, es decir, WGS-84, Cuadrícula o Local. Las coordenadas guardadas para un punto, y el origen de la coordenada, se mostrarán en la lista arbórea de la izquierda de la ventana Propiedades.

Hay un número limitado de coordenadas introducidas que se pueden asociar a un punto.  Solamente se puede introducir una coordenada WGS-84 y una coordenada de cuadrícula/local para cada punto. Si ya ha añadido una coordenada WGS-84, la opción de coordenada WGS-84 no estará disponible.

Unicamente añada una coordenada cuando está seguro de que desea utilizar esta coordenada en lugar de observaciones, puesto que los recálculos utilizan coordenadas tecleadas en lugar de observaciones de la misma calidad. Ello asegura el empleo de un punto de diseño en vez de una observación de replanteo.

NOTA: Se añadirá un prefijo al nombre de coordenada introducido para mostrar si la coordenada es una coordenada de cuadrícula (C), local (L) o WGS-84 (W).

Trimble Geomatics Office podrá generar y almacenar coordenadas adicionales para un punto. Estas coordenadas pueden incluir:

 coordenadas derivadas de un ajuste

  coordenadas WGS-84 ajustadas guardadas para la calibración

Al añadir una coordenada, los componentes de coordenadas aparecerán como nulos (?). Se podrá utilizar el botón Insertar el valor actual [image] para llenar cada campo de componente de coordenadas con el valor actual de los componentes de coordenadas y la calidad según se muestra en la página Resumen. Este botón sólo está disponible cuando ha seleccionado el campo de componente de coordenada que quiere llenar.

Edición de coordenadas

Se podrán editar las coordenadas introducidas. Sin embargo, no se podrán editar las coordenadas adicionales, tales como las coordenadas de ajuste y de calibración que el software crea.

Solamente se podrán editar componentes de coordenadas si la vista actual es la misma que la de la configuración Guardar como tipo de coordenada. Una vez que se han editado los componentes de coordenadas, el origen se cambiará a introducidas en la oficina, o a varios orígenes si se editan tan sólo algunos componentes.

Coordenadas de diversos orígenes

El origen de una coordenada se muestra en la ventana Propiedades. Si una coordenada ha sido derivada de uno o más orígenes, entonces se mostrará como de origen múltiple. Por ejemplo, si la coordenada horizontal de un punto deriva de un archivo importado y la altura ha sido introducida en Trimble Geomatics Office, el punto se mostrará como que tiene coordenadas derivadas de orígenes múltiples.

SUGERENCIA: La Información sobre herramientas se podrá usar en la página de la coordenada para examinar los orígenes de cada componente de coordenada.

Mover coordenadas

En Trimble Geomatics Office, cuando una coordenada se mueve o se transforma, se inhabilitarán todas las observaciones, por lo tanto si quiere calcular las coordenadas otra vez, tendrá que habilitarlas. Para hacerlo, use el diálogo Edición múltiple.

Eliminación de coordenadas

Para eliminar una coordenada, use el botón Eliminar [image].

NOTA: No se podrán editar las coordenadas fijas para un ajuste.

Calidad de las coordenadas

Cada coordenada que se muestra en la ventana Propiedades tendrá una calidad asignada a la misma. Las siguientes calidades de coordenadas se podrán editar:

  Calidad de control

  Calidad topográfica

  Calidad cartográfica

  Calidad desconocida

La calidad de un punto de control fijo no se podrá cambiar.


Ventana Propiedades - Ficha Levantamiento - Página Eventos
Ventana Propiedades − Ficha Levantamiento − Página Eventos

Use la ficha Levantamiento en la ventana Propiedades para ver los datos de eventos.

Para acceder a la misma, desde la ventana Propiedades:

  En la ficha Levantamiento, haga clic en el botón de menú Eventos [image].

ID evento receptor

Este campo muestra el ID del evento.

Método interpolación

Este campo muestra si el método de interpolación es lineal o cuadrático.

Puntos en la inserción

Este campo muestra el número de puntos que se utilizan para insertar el arco de interpolación.

ID puerto receptor

Este campo muestra el ID del puerto del receptor.

Tipo de solución

Este campo muestra el tipo de solución

RMS

Muestra el valor RMS.

Estado

En esta lista, seleccione el estado que quiere que tenga la observación. Este estado se considera durante el recálculo, o el recálculo topográfico.


Ventana Propiedades - Ficha Estación y d.eje

La ficha Estación y d.eje muestra información sobre los puntos que se han medido utilizando un programa de Estación y d.eje en un dispositivo de Trimble.

En la ventana Propiedades:

1.	Seleccione la ficha Estación y d.eje.

2.	Haga clic en el botón Estación / D.eje.

Nombre

Este campo contiene el nombre de la característica de línea.

Estación

Este campo contiene la estación de la característica de línea del punto medido.

NOTA: Para el instrumento Trimble 3300, si se usa una distancia al eje de construcción de la línea de referencia, la distancia al eje se mostrará en el campo de nombre junto con el nombre del punto de inicio y final de la línea.

D.eje

Este campo contiene la distancia al eje de la característica de línea para el punto medido.

Incremento elevación

Este campo contiene la diferencia de elevación entre la estación en la característica de línea y el punto medido.


Calibración local GPS - Visión de conjunto
    Calibración local GPS − Visión de conjunto

Más información

Cómo ...	Diálogo
Visión de conjunto

El proceso de calibración local GPS establece la relación entre los datos WGS-84 capturados por receptores GPS y las posiciones de control (expresadas como una cuadrícula del mapa local con elevaciones sobre el nivel del mar). Esta relación se define por una serie de transformaciones matemáticas. La función Calibración local GPS le permite hacer coincidir los puntos de control local y GPS que se van a utilizar en la calibración. (Las coordenadas GPS deben derivar de observaciones y puntos GPS y los puntos de la cuadrícula deben derivar de puntos de la cuadrícula y observaciones terrestres). Trimble Geomatics Office luego calcula y aplica las transformaciones matemáticas utilizando cuadrados mínimos. Se puede volver a calibrar en cualquier momento.

Las transformaciones matemáticas que se aplican a fin de convertir las posiciones WGS-84 a coordenadas de la cuadrícula son:

1.	Una transformación de datum para convertir la latitud, longitud y coordenadas de altura elipsoidal WGS a latitud, longitud y coordenadas de altura elipsoidal relativas al elipsoide de la cuadrícula del mapa local.

2.	Una proyección de mapa para convertir las coordenadas de latitud y longitud del elipsoide local a coordenadas Norte y Este de la cuadrícula del mapa local (en general, el valor altura no se modifica en dicho proceso).

3.	Un modelo geoidal en alturas WGS-84 para obtener la elevación aproximada sobre el nivel del mar.

4.	Un ajuste horizontal de las coordenadas de la cuadrícula transformadas para se adapten mejor a los datos de control local. Este ajuste tiene en cuenta cualquier variación local en el sistema de proyección que no pueda considerarse en la transformación de datum general.

5.	Un ajuste de altura para convertir las alturas sobre el elipsoide local o elevaciones derivadas de las elevaciones del geoide al control local sobre el nivel del mar.

Para cambiar las configuraciones de calibración (que definen los residuales más altos permitidos), utilice el registro de la computadora.

Los parámetros de calibración horizontal y vertical anteriores están almacenados como parte de la definición del sistema de coordenadas. Todos los puntos GPS en la base de datos se actualizan utilizando parámetros de calibración, lo que produce valores de coordenadas de la cuadrícula local más precisos.

Para guardar la nueva definición de sistema de coordenadas (que incluye los parámetros de calibración) como un local a fin de utilizarlo en proyectos futuros en la misma área, haga clic en Guardar como local en el diálogo Calibración.

Si guarda una calibración como un ajuste con el propósito de usarlo en otro proyecto, asegúrese de que el área del proyecto esté completamente encerrada por los puntos utilizados en la calibración. Por ejemplo, en el siguiente diagrama, es válido utilizar la definición de ajuste para el proyecto B, no así para el proyecto C.

Si utiliza la tecla [image] en Trimble Survey Controller para iniciar una base cinemática en tiempo real (RTK) y transfiere el archivo (.dc) del Survey Controller a Trimble Geomatics Office, la posición base (y por lo tanto todos los puntos móvil de la base) es de calidad desconocida (para todos los componentes, horizontal, altura y elevación).

Si utiliza el software Trimble Geomatics Office para realizar una calibración local GPS, cambiarán las calidades del componente horizontal de la posición del punto.

Si está seguro de que la calibración local GPS ha mejorado la calidad de los puntos, utilice la ventana Propiedades para cambiar la calidad del punto base. Los puntos móvil de la base tendrán la misma calidad que la asignada al punto base.

NOTA: Por defecto, si realiza una calibración local GPS utilizando un punto de la estación base RTK con coordenadas WGS-84, se inhabilitarán las coordenadas de la cuadrícula del punto.  Sin embargo, podrá emplear la posición de la cuadrícula para una calibración local GPS. Si opta por hacerlo, tendrá que habilitar la coordenada de la cuadrícula (asegúrese de que tenga una calidad más alta que la coordenada WGS-84), separe los puntos por tipo de dato y luego vuelva a calibrar.  Si no lo hace, los vectores GPS fluirán de la posición de la cuadrícula:

  los puntos GPS derivados de la base no se pueden emplear en la calibración

  se puede introducir un error, equivalente al error residual de la calibración

NOTA: Si ha realizado una calibración local GPS y ha seleccionado la casilla de verificación Usar coordenadas terrestres en el diálogo Configs ajuste local, la calibración que ha definido en el proyecto será inválida. Un mensaje de error le advertirá que al seguir con la operación se quitará la calibración.

Utilización de modelos geoidales

Si el sistema de coordenadas del proyecto define el uso de un modelo geoidal para determinar los valores de las elevaciones de puntos, las elevaciones se determinarán directamente a partir de las alturas WGS-84 por interpolación en la cuadrícula del modelo geoidal. Sin embargo, todavía se puede aplicar un ajuste de altura sobre las elevaciones producidas por un modelo geoidal para tomar en cuenta variaciones locales pequeñas que un modelo geoidal de gran escala no puede considerar. La aplicación de un ajuste de altura a alturas locales o WGS-84 con calidad topográfica producirá una elevación de la misma calidad.

Reglas para garantizar una calibración útil

  las coordenadas WGS-84 deben ser relativamente correctas.

Es posible generar puntos GPS autónomos. Sin embargo, en una calibración no se debe utilizar más de un punto WGS-84 autónomo, por ejemplo asegúrese de que se ha configurado solamente una estación base utilizando la tecla [image] en Trimble Survey Controller. Otras estaciones base se deben configurar en posiciones que un vector GPS ha medido con respecto a la estación base autónoma. Ello define la relación entre las mismas y le permite realizar una calibración con puntos empleados de una de las estaciones base correctamente. Esto se describe más adelante:

La siguiente figura no muestra ninguna relación entre las estaciones base:

Los puntos de la Base 1 y la Base 2 no deben utilizarse para la calibración.

En la siguiente figura, se define una relación entre las estaciones base al ocupar la segunda estación base utilizando la primera estación base:

Los puntos de la Base 1 y la Base 2 se pueden utilizar para una calibración.

  En un levantamiento deberían utilizarse las mejores coordenadas WGS-84 posibles para la estación base inicial.

La precisión de vectores GPS (en tiempo real o con posprocesamiento) está afectada por la precisión de la coordenada base. Se puede introducir un error de hasta una parte por millón (1 ppm) por cada diez metros de error en las coordenadas base. Por ejemplo, el punto de referencia WGS-84 primario tiene un error de cien metros y la línea base tiene una longitud de dos kilómetros, tal vez tenga un error adicional innecesario de dos centímetros en los vectores GPS.


Cambio de las configuraciones de calibración utilizando el registro

 Visión de conjunto y más información

Al instalar Trimble Geomatics Office, se añade una configuración de registro a la computadora que controla:

  el número de iteraciones realizadas en el cálculo por cuadrados mínimos de los parámetros de calibración

  el error máximo permitido entre las posiciones calibradas y de la cuadrícula conocidas para los puntos de calibración

Usando las entradas, puede controlar cuando se presenta una advertencia. Este indica que el cálculo no cumple con el criterio de error máximo permitido.

Entradas de registro

Las entradas (Error máximo y Cuenta de iteración máxima) están en la clave de registro:

HKEY_CURRENT_USER\Software\Trimble\Trimble Geomatics Office\1.6\Calibration

Error máximo

Utilice dicha entrada para cambiar el Error máximo. El valor es el error polar horizontal máximo (residual) que se permite entre una posición de punto de calibración calculada y la posición de la cuadrícula conocida asociada.

Si se excede dicho error especificado aparecerá un mensaje de error que indica que el cálculo de calibración excedía el residual horizontal máximo definido.

Los resultados de la calibración pueden exceder el error máximo especificado en una de las siguientes situaciones:

  se ha cometido un error en la entrada de uno de los puntos de control de la cuadrícula

  uno de los puntos de control se ha identificado mal o se ha fijado incorrectamente durante un levantamiento

  el cálculo de calibración no convergía dentro del número especificado de iteraciones

Cuanto más pequeño sea el valor en el campo Error máximo, mayor será la posibilidad de obtener el mensaje de que se ha excedido el error máximo. Esto se debe a que se han definido criterios más estrictos para la coincidencia de posiciones calculadas con posiciones conocidas.

El valor por defecto para dicho campo (siempre definido en metros) es de 0.1 m.

Cuenta de iteración máxima

Utilice dicha entrada para cambiar el número máximo de iteraciones. La misma proporciona control sobre el número máximo de iteraciones a realizarse en el cálculo por cuadrados mínimos de los parámetros de calibración. La configuración de dicho valor en un número más alto hace que los cálculos realicen más iteraciones, a menos que el cálculo detecte que los parámetros calculados ya no cambian con cada iteración.

El rango válido para dicho valor es de 5 a 5000. Si configura un valor de menos de 5, se usará el valor mínimo de 5. Si configura un valor de más de 5000, se empleará el valor máximo de 5000 iteraciones. El número por defecto de iteraciones es de 10.


Comando Calibración local GPS

Use este comando para realizar una calibración local GPS.

Para acceder al mismo, seleccione Levantamiento / Calibración local GPS.

Aparecerá el diálogo Calibración local GPS.

NOTA: Antes de que aparezca el diálogo Calibración local GPS, si se han definido parámetros de transformación del ajuste de la red, se descartarán al realizar una calibración local GPS. Si tiene puntos con el mismo nombre que se han mezclado, un mensaje le pedirá si desea separar los puntos por tipo de dato.


Diálogo Calibración local GPS

 Visión de conjunto y más información

Use este diálogo para realizar una calibración local GPS.

Para acceder al mismo, seleccione Levantamiento / Calibración local GPS.

Para realizar una calibración local GPS:

1.	Especifique los componentes de calibración que se van a calcular.

2.	Defina la lista de pares de coordenadas. Un par es una posición de la cuadrícula derivada y una posición GPS derivada para el mismo punto físico.

3.	Aplique la calibración actual a la base de datos.

Componentes calibración

El grupo Componentes calibración contiene las siguientes casillas de verificación y campos:

Transformación de datum

Normalmente hay una transformación de datum predefinida disponible como parte de la definición de sistemas de coordenadas. Esta transformación puede ser de tres parámetros, de siete parámetros, de regresión múltiple o basada en archivos de cuadrícula del datum (por ejemplo, Nadcon). En dichos casos es poco probable que desee calcular una transformación de datum diferente, por lo tanto deje la casilla de verificación Transformación de datum inhabilitada. Sin embargo, si no hay información sobre la transformación de datum disponible o si tiene motivos para dudar sobre los parámetros disponibles, entonces calcule una transformación de datum.

Para calcular una transformación de datum entre el elipsoide WGS-84 y el elipsoide local utilizado como parte de la definición del sistema de coordenadas para el proyecto, seleccione dicha casilla de verificación. Estarán disponibles las opciones Transformación de tres parámetros y Transformación de siete parámetros. Seleccione el tipo de transformación de datum a calcular.

NOTA: Esta opción no está disponible en proyectos que tienen un sistema de coordenadas de proyección por defecto (Mercator transversa), puesto que la Proyección por defecto se basa directamente en el elipsoide WGS-84, lo que significa que no se necesita una transformación de datum.

Si se calcula una transformación de datum y la calibración se aplica a la base de datos, el campo Datum en la ficha Sistema de coordenada en el diálogo Propiedades proyecto mostrará 'Calibración'.

Actualizar origen de la proyección por defecto

Esta opción sólo está activa si la definición del sistema de coordenadas actual utiliza una Proyección por defecto. Emplee esta opción para actualizar el origen de la proyección utilizando el primer punto de control bidimensional en la Lista de puntos. Puesto que la proyección por defecto no tiene definido un origen de latitud y longitud de un Norte falso y Este falso, la actualización del origen asegurará que el origen del proyecto sea local (es decir, próximo a los datos topográficos en el proyecto).

Si está realizando una calibración GPS en un proyecto que ha tiene la proyección por defecto definida, entonces tendrá que asegurarse de que esta casilla de verificación esté inhabilitada para no modificar la definición de la proyección por defecto.

Ajuste horizontal

Seleccione esta opción para calcular un ajuste horizontal. La casilla de verificación Configurar factor de escala a 1 estará disponible. Si no desea escalar las distancias, utilice esta opción para configurar el factor de escala en uno. El ajuste horizontal es una transformación plana que consiste en traslaciones en dirección Norte/Sur y Este/Oeste, una rotación alrededor de un origen definido y un factor de escala. Los parámetros de transformación se calculan utilizando métodos por cuadrados mínimos para encontrar la transformación que proporciona los parámetros de ajuste que, al aplicarlos a las posiciones GPS, mejor se adaptan a las coordenadas de la cuadrícula de control.

El ajuste horizontal reduce los errores residuales entre las coordenadas de control y las coordenadas de la cuadrícula calculadas a partir de posiciones GPS..

SUGERENCIA: Por lo general resulta prudente calcular un ajuste horizontal sin configurar el factor de escala a uno inicialmente para comprobar si el factor de escala calculado es de alrededor de uno. Si no lo es, entonces ello puede indicar un problema en los pares de puntos de calibración seleccionados.

Ajuste vertical

Seleccione esta opción para calcular un ajuste vertical. Es un ajuste de plano inclinado que consiste en un desplazamiento vertical en un origen definido e inclinaciones en dirección Norte y Este. Los parámetros para dichos ajustes se calculan utilizando métodos por cuadrados mínimos para encontrar un ajuste de plano que mejor se adapte a las elevaciones derivadas de alturas GPS con elevaciones del Punto de control. Ello requiere pares de puntos de calibración tridimensionales, Con un sólo par de puntos de calibración tridimensionales, solamente se puede calcular el parámetro de desplazamiento vertical. Si hay dos pares de puntos de calibración tridimensionales disponibles, el sistema define un plano de corrección que se adapta perfectamente a dichos pares.

Si el proyecto utiliza un modelo geoidal, entonces se calculará el ajuste vertical y se aplicará sobre las correcciones del modelo geoidal.

Modelo geoidal

Este campo muestra el nombre del modelo geoidal que se selecciona como parte de la definición del sistema de coordenadas. Si no hay ningún modelo geoidal, se mostrará “Ninguno”. Este es un campo de visualización solamente. La configuración Modelo geoidal sólo se puede cambiar utilizando la ficha Sistema de coordenadas en el diálogo Propiedades proyecto.

Lista de puntos

Haga clic en Lista de puntos para seleccionar los pares de puntos de calibración que se usarán en los cálculos de calibración. El diálogo Calibración local GPS está oculto y aparecerá el diálogo Lista de puntos.

Resumen de cálculos

Los campos de este grupo presentan un resumen del último cálculo de calibración realizado. Use el resumen para confirmar que la calibración calculada es válida sin tener que consultar el informe de cálculos.

Factor de escala de ajuste horizontal

El factor de escala de ajuste horizontal presenta el factor de escala calculado para el ajuste horizontal. Si ha seleccionado la casilla de verificación Configurar factor de escala 1 entonces dicha casilla mostrará uno. Utilice este campo para confirmar que el factor de escala calculado es de alrededor de uno. Si no lo es, entonces ello indicaría que hay un problema con uno o más de los pares de puntos de calibración.

Inclinación máx de ajuste vertical

Este campo presenta la máxima inclinación del ajuste de altura calculado basado en los valores de Pendiente Norte y de Pendiente Este calculados.

Residual horizontal máx y Residual vertical máx

Estos campos muestran los residuales máximos del último cálculo efectuado.

Aceptar

Haga clic en Aceptar para aplicar la última calibración calculada a la base de datos.

Se realiza un cálculo para asegurarse de que todos los puntos GPS se actualizan según la calibración GPS. Los detalles del sistema de coordenadas se actualizan con los parámetros de calibración.

Para ver los detalles de calibración:

1.	Seleccione Archivo / Propiedades proyecto.

2.	Seleccione la ficha Sistema de coordenadas.

3.	Haga clic en Detalles.

4.	Seleccione la ficha Ajuste horizontal o la ficha Ajuste vertical.

Cancelar

Haga clic en Cancelar para salir del diálogo Calibración local GPS sin aplicar la calibración calculada.

Calcular

Haga clic en Calcular para calcular los parámetros de calibración GPS después de haber cambiado una de las configuraciones del componente de calibración. Una vez efectuada dicha calibración los resultados se resumen en los campos Resumen de cálculos.

Guardar como local

Haga clic en Guardar como local para guardar la información de calibración y sistema de coordenadas actual en la base de datos de sistemas de coordenadas como una definición local. Aparecerá el diálogo Guardar como local. Introduzca el nombre para la definición de ajuste guardada y haga clic en Aceptar. Se puede usar esta definición de ajuste como la definición del sistema de coordenadas para futuros proyectos.

NOTA: Sólo se puede guardar una definición de sistema de coordenadas como un ajuste local si el sistema de coordenadas del proyecto usa una Proyección plana o si la proyección ha sido seleccionada utilizando Cambiar en la ficha Sistema de coordenadas en el diálogo Propiedades proyecto. Este botón no estará disponible si no es posible guardar la definición de sistemas de coordenadas como un ajuste local.

Sistema de coord

Haga clic en Sistema de coord para ver los detalles del sistema de coordenadas actual para el proyecto. El mismo diálogo aparecerá como el diálogo Detalles en la ficha Archivo / Propiedades proyecto / Sistema de coordenadas.

Informe

Haga clic en Informe para ver un informe detallado del cálculo de la calibración. Este informe muestra todos los parámetros calculados además de una lista con las coordenadas de los puntos de control calculados comparados con sus posiciones conocidas y valores residuales individuales.


Calibración local GPS - Diálogo Lista de puntos
Calibración local GPS − Diálogo Lista de puntos

Use este diálogo para seleccionar los pares de puntos de calibración que desea usar para calcular los parámetros de Calibración local GPS.

Para acceder al mismo:

1.	Seleccione Levantamiento / Calibración local GPS.

Aparecerá el diálogo Calibración local GPS.

2.	Haga clic en Lista de puntos.

Aparecerá el diálogo Calibración local GPS − Lista de puntos.

Este diálogo representa una lista de desplazamiento de los grupos de pares de puntos de calibración. No hay un límite específico sobre el número de pares que pueden definirse para calcular una calibración. Al añadir muchos pares no siempre se mejorarán los resultados de la calibración pero se proporcionarán comprobaciones adicionales sobre la validez de los parámetros calculados.

Cada par de puntos de calibración consiste en un punto GPS (un punto con una posición GPS o uno derivado de un vector GPS) y un punto de la cuadrícula (que por lo general es un punto de control o ajustado o derivado de observaciones terrestres) que no puede ser un punto con derivación GPS.

NOTA: Un punto GPS tiene que derivar de un vector GPS que fluye de una coordenada WGS-84. Un vector GPS que fluye de una coordenada de la cuadrícula no se puede utilizar para definir un punto GPS.

A medida que se seleccionan o especifican puntos a incluir en la lista, el sistema comprueba que cada punto GPS tenga realmente una derivación GPS y que cada punto de la cuadrícula no la tenga.

Las posiciones de los pares de puntos de calibración están resaltadas en la ventana gráfica con un símbolo de cuadro en el punto GPS y un símbolo de cruz en el punto de control y una línea que una las dos posiciones. Deberá ampliar uno de los pares de puntos de calibración para observar este detalle. Los símbolos y la línea de unión para el par de puntos de calibración actual en la lista de puntos se mostrará con líneas de puntos.

Por lo general, los puntos para los pares de puntos de calibración se seleccionan utilizando Rellenar campo para elegir los puntos adecuados de la ventana gráfica. Rellenar campo sólo permite que los puntos con derivación GPS se seleccionen como un punto GPS y los puntos sin derivación GPS como un punto de la cuadrícula. También pueden introducirse los nombres de los puntos que quiera utilizarse en los campos Punto GPS y Punto de control.

Si un punto GPS tiene una elevación de cuadrícula que se utiliza (y que no deriva de la altura GPS y del modelo geoidal), entonces se puede utilizar el mismo punto en el punto GPS y el punto de la cuadrícula en el cálculo de un ajuste vertical. Si lo hace, el campo Tipo se configurará en Vertical.

NOTA: Si tiene dos puntos diferentes (un punto GPS y un punto de la cuadrícula) con el mismo nombre, cuando se selecciona el punto GPS, el punto de la cuadrícula con el mismo nombre se seleccionará automáticamente. Si las coordenadas GPS y de la cuadrícula se guardan en el mismo punto, deberá separar los puntos por tipo.

Si no tiene puntos de control de la cuadrícula o puntos GPS adecuados en la base de datos, entonces puede especificar los valores de coordenada apropiados para dichos puntos en los campos que se proveen. En este caso, no se debe especificar el nombre de punto para el punto puesto que Trimble Geomatics Office espera un punto con dicho nombre en la base de datos. Las posiciones introducidas de esta forma no se almacenan en la base de datos.

Para especificar valores de coordenadas (Puntos GPS o Punto de la cuadrícula) para la calibración:

1.	Haga clic en el icono más (+) junto al Punto GPS o al Punto de la cuadrícula en los campos Nombre.

La vista arbórea se expande para mostrar los campos de coordenadas.

2.	Use Rellenar campo o introduzca un valor usando el teclado para completar los campos de coordenadas.

Si no puede seleccionar un punto GPS para usarlo en una Calibración local GPS, consulte el tema Problemas con la selección de puntos para una calibración local GPS.

Tipo

Use esta opción para especificar cómo el par de puntos de calibración se utiliza en el cálculo de calibración. Trimble Geomatics Office automáticamente completa este campo con el tipo adecuado al seleccionar un par de coordenadas. Se puede cambiar el tipo, siempre y cuando la opción que seleccione sea válida. Por ejemplo, si el punto de control no tiene una elevación, se puede configurar el campo Tipo para el par en Horz y Vert.

Las opciones disponibles son:

  Horz y Vert − especifica que el par de puntos de calibración es adecuado para usarlo en la determinación de los ajustes horizontal y vertical.

  Horizontal − especifica que el par de puntos de calibración es adecuado para usarlo solamente en la determinación de un ajuste horizontal. En realidad el valor de elevación para el punto de control no es fiable.

  Vertical − especifica que el par de puntos de calibración es adecuado para usarlo solamente en la determinación de un ajuste vertical. En realidad los valores Norte y Este para el punto de control no son fiables.

 (Ignorado) − especifica que el par de puntos de calibración no se debe utilizar en el cálculo de los parámetros de transformación. Esta es una opción útil si ha encontrado un problema en el cálculo de calibración y está tratando de ubicar un par de puntos de calibración esperado. Puede utilizar esta configuración para quitar un par de puntos de calibración temporalmente del cálculo para ver si mejoran los resultados.

(Inválido) − muestra que el par de puntos seleccionado no es un par válido.

Estadísticas

Los campos en este grupo presentan los resultados de la calibración basándose en los valores que se han añadido en la Lista de puntos. Use el resumen para comprobar las estadísticas de calibración e identificar pares de puntos malos antes de aceptar la Lista de puntos.

Factor de escala de ajuste horizontal:

Este campo muestra el factor de escala calculado para el ajuste horizontal. Si ha seleccionado la casilla de verificación Configurar factor de escala a 1, entonces la misma mostrará “uno”. Use este campo para confirmar que el factor de escala calculado se aproxima a uno. De no ser así, esto mostrará que hay un problema con uno o más de los pares de puntos de calibración.

Inclinación máx de ajuste vertical:

Este campo presenta la inclinación máxima para el ajuste de altura calculado, basándose en los valores pendiente norte y pendiente este.

Residual horizontal máx y Residual vertical máx

Estos campos muestran los residuales máximos.

Insertar

Haga clic en Insertar para insertar un registro de par de puntos de calibración vacío. Esto es útil si está utilizando la Proyección por defecto y desea actualizar el origen de la proyección. El primer par de puntos se utiliza para actualizar el origen, por lo tanto use este botón para insertar un nuevo par de puntos de calibración en blanco en el comienzo de la lista.

Eliminar

Haga clic en Eliminar para quitar un par de puntos de calibración de la lista.


Problemas con la selección de puntos para una Calibración local GPS

Si está utilizando el diálogo Calibración local GPS − Lista de puntos para seleccionar puntos para una calibración local GPS y el sistema no le deja seleccionar un punto para el punto GPS o el punto de la cuadrícula del par de puntos de la calibración, esto se debe a lo siguiente:

El punto ‘desde’ está derivado de una cuadrícula.

El punto es el resultado de un vector donde el ‘desde punto’ del vector ha sido derivado de una posición de la cuadrícula. Esto puede ocurrir si ha tecleado una posición de la cuadrícula para una estación base después del levantamiento Cinemático en tiempo real (RTK). Una posición GS-84 para la base se calcula utilizando una posición de la cuadrícula. Se aplican los vectores que fluyen de la estación base. Sin embargo, la posición de cualquiera de estos puntos se deriva utilizando una combinación de valores WGS-84 (el vector) y valores de cuadrícula (la posición WGS-84 base). No se pueden usar puntos a los que se aplican vectores de la base. Ello se indica en las siguientes figuras:

  El punto 1 no se puede usar como un Punto GPS en una Calibración local GPS.

La posición de la cuadrícula base se convierte a WGS-84 y luego se aplica el vector al punto de la posición 1.

  El punto 1 se puede usar como un Punto GPS en una Calibración local GPS.

El vector se aplica a la posición WGS-84 base para determinar la posición del punto 1.

Para solucionar este problema, utilice la ventana Propiedades para editar las coordenadas para el punto e introducir una posición WGS-84. Ello se utilizará de preferencia a la posición de la cuadrícula y todos los vectores que fluyen de la estación base estarán disponibles como Puntos GPS en una Calibración local GPS.

De la misma manera en que un punto GPS no se puede seleccionar porque el punto “desde” deriva de una posición de la cuadrícula, un punto de la cuadrícula no se podrá utilizar si el punto desde deriva de una posición GPS. Un punto de la cuadrícula debe fluir de una observación terrestre.


Transformación de tres parámetros

Use una calibración local GPS para definir una transformación de datum si no ha definido un sistema de coordenadas y desea crear sus propios parámetros de transformación de datum para el área del proyecto.

El algoritmo de la transformación de tres parámetros calcula valores de traslación a lo largo de los ejes cartesianos X, Y y Z del centro del elipsoide WGS-84 al centro del elipsoide para la proyección local. Las posiciones de punto de control se utilizan para determinar el posicionamiento espacial del elipsoide local y de ahí su relación con el elipsoide WGS-84.


Transformación de siete parámetros

Use una calibración local GPS para definir una transformación de datum si no ha definido un sistema de coordenadas y desea crear sus propios parámetros de transformación de datum para el área del proyecto.

El algoritmo de la transformación de siete parámetros calcula tres valores de traslación, tres valores de rotación y un cambio de escala entre el elipsoide WGS-84 y el elipsoide para la proyección local. Los tres valores de traslación se calculan junto a los ejes cartesianos X, Y y Z del centro del elipsoide WGS-84 al centro del elipsoide local como en la transformación de tres parámetros. Calcula rotaciones alrededor de cada eje entre los dos elipsoides y un factor de escala que tenga en consideración cualquier diferencia de tamaño entre los dos elipsoides (debido a distintos semiejes mayores del elipsoide y valores de achatamiento).

Las posiciones del punto de control se utilizan para determinar el posicionamiento espacial del elipsoide local y de ahí su relación con el elipsoide WGS-84. Hay correlaciones cercanas entre los valores de traslación y rotación calculados (es decir, el resultado de un ángulo de rotación muy pequeño aplicado sobre un radio grande tal como el radio de la Tierra, es muy similar a una traslación). Esto significa que es fácil terminar con grandes valores de compensación calculados que no son precisos si los puntos de control no cubren una zona lo suficientemente grande. Por lo general, no debería calcularse una transformación de siete parámetros a menos que los puntos de control cubran una extensión de aproximadamente ochenta kilómetros por ochenta kilómetros. Además los valores de rotación calculados no deberían exceder los 10° de un arco.


Observaciones GPS - Visión de conjunto
Observaciones GPS − Visión de conjunto

 Véase también

Una observación GPS, o línea base, es un vector entre dos puntos observados utilizando el GPS. Los dos puntos empleados para determinar una línea base dependen de la técnica topográfica utilizada. Por ejemplo, en un levantamiento Cinemático en tiempo real (RTK) o un levantamiento Cinemático con posprocesamiento (PPK), existe una línea base desde la estación base a cada punto móvil.

Sin embargo, con los levantamiento estáticos y estáticos rápidos, no hay estación base. Con dichas técnicas topográficas, existe un vector GPS entre puntos que han sido ocupados a la vez, como se muestra en la siguiente tabla:

Para ver el tipo de línea base, selecciónela y abra la ventana Propiedades.

Vectores estáticos, estáticos rápidos y cinemáticos con posprocesamiento (PPK)

Las observaciones estáticas, estáticas rápidas y PPK que no han sido posprocesadas son líneas base potenciales. Cuando las líneas base se han posprocesado se convierten en líneas base con posprocesamiento.

Al eliminar una línea base con posprocesamiento, la misma vuelve a ser una línea base potencial. Se puede eliminar la línea base eliminando los puntos. Alternativamente, inhabilite la línea base si no desea que se la utilice en otros cálculos topográficos y aún quiere conservar los puntos.

Vectores PPK continuos

Cuando se han posprocesado los vectores PPK continuos, éstos se muestran del mismo color que las líneas base PPK, pero el Método campo se visualiza como ‘Continuo’ en la ventana Propiedades.

Vectores RTK

Los vectores RTK no pueden ser líneas base potenciales, se muestran como ‘líneas base RTK’ en la ventana Propiedades. Los vectores RTK continuos se muestran del mismo color que las líneas base RTK, pero el Método campo se visualiza como ‘Continuo’ en la ventana Propiedades.

Vectores de comprobación

Si el estado de una línea base está configurado en 'Comprobar', la línea base se mostrará con líneas de guiones.

Vectores inhabilitados

Si el estado de una línea base está configurado en 'Inhabilitado', la línea base se mostrará con el color adecuado para las líneas base inhabilitadas.


Ocupaciones GPS

Se creará un registro de ocupación GPS cada vez que un punto se observa utilizando el GPS.

Para ver registros de ocupación GPS usando la ventana Propiedades:

1.	Seleccione una de las siguientes opciones:

  un punto observado utilizando el GPS

  la línea base (en la Vista del levantamiento)

2.	Haga clic en el icono [image] para ver el registro de ocupación GPS.

Si selecciona un punto observado utilizando el GPS en la ventana Propiedades, se pueden ver todos los registros de ocupación GPS para dicho punto. Si selecciona una línea base usando la ventana Propiedades, podrá ver la Ocupación GPS que ha producido la línea base.

El registro de ocupación GPS incluye:

  El nombre de punto.

  La longitud (en tiempo) para la ocupación y el tiempo inicial de la misma.

  Los detalles de la antena GPS incluyendo la altura de antena, el tipo y el método.

Durante la importación de datos los tiempos inicial y final se convierten de hora GPS a hora UTC (Hora Universal Coordinada - en realidad la Hora Media de Greenwich). Así las horas se muestran como horas locales utilizando el huso horario actual configurado en Microsoft Windows.


Constante prisma

La constante del prisma es una corrección a la distancia inclinada medida con una estación total.  Se aplica durante el recálculo. Es necesaria puesto que la superficie de reflexión del prisma no está directamente sobre el punto topográfico que se está midiendo. Por lo general, la constante es un valor negativo.

Donde:

	es la distancia inclinada corregida
	es la distancia inclinada medida
	es la constante del prisma

El valor constante del prisma está almacenado con la información de config destino.

Para ver y editar un valor constante del prisma:

1.	Seleccione un punto de configuración de destino o una observación convencional.

2.	Abra la ventana Propiedades.

Haga clic en el botón [image].

NOTA: En el software 3300/3600/5600 Elta y 3600/5600 GDM, la constante de prisma se aplica en el instrumento pero no se almacenará en el archivo. La constante de prisma se muestra como ‘?’.

Si se ha configurado una constante incorrecta en el instrumento y quiere corregir el valor en Trimble Geomatics, en el campo de constante de prisma de la ventana Propiedades, introduzca la diferencia entre la constante incorrecta y la correcta. Por ejemplo, si ha introducido una constante de prisma de “20”, y debería haber sido “5”, introduzca “–15”.

SUGERENCIA: Se podrá utilizar el diálogo Edición múltiple para editar observaciones múltiples.


Correcciones de la excentricidad de montaje del equipo de medición electrónica de distancias (MED)

La mayoría de estaciones totales de módem no necesitan una corrección de la excentricidad de montaje, puesto que el camino de medición de la medición electrónica de distancias (EDM) coincide con la línea de mira del telescopio. Esta corrección no se necesita si se utiliza una MED montada en un telescopio con un reflector de inclinación donde el reflector/destino está diseñado para coincidir con la configuración de la MED/telescopio.

Sin embargo, en algunos casos quizá se necesite calcular una corrección a la distancia inclinada medida para encontrar la distancia inclinada verdadera que hubiera observado si el camino de medición de la MED hubiera coincidido con la línea de mira del telescopio. La corrección de excentricidad de montaje depende del tipo de sistema de montaje y Trimble Geomatics Office la aplica automáticamente utilizando las correspondientes fórmulas que se muestran más adelante.

Los valores de distancia al eje apropiados se almacenan en el registro de instrumento del archivo de dispositivo.

1. MED montadas en postes con reflector ininclinable.

Donde:

	es la distancia inclinada corregida
	es la d.eje MED (en el instrumento)
	es la d.eje del reflector (en el destino)
	es el ángulo vertical cenital (observado)
	es la distancia inclinada medida (una vez aplicada la corrección de constante del prisma)

2. MED montada en telescopio con reflector ininclinable.

Donde:

	es la distancia inclinada corregida
	es la d.eje MED (en el instrumento)
	es la d.eje del reflector (en el destino)
	es el ángulo vertical cenital (observado)
	es la distancia inclinada medida
Esta corrección se aplica durante la importación de un archivo de dispositivo.

NOTA: Trimble recomienda registrar la presión y temperatura en el software Trimble Survey Controller.


Corrección de presión y temperatura

Este tipo de correcciones se efectúa en distancias medidas electrónicamente para corregir las variaciones resultantes en la longitud medida debido a la presión y temperatura. Se pueden introducir los valores adecuados durante el trabajo de campo o editar el archivo de dispositivo antes de importarlo.

Las medidas de distancia electrónica tomadas por las MEDs se basan en la velocidad de la luz a través de la atmósfera. La temperatura y presión afectan dicha velocidad.

Esta corrección atmosférica sólo se realiza en medidas de distancia si la MED aún no ha aplicado la corrección apropiada.

Donde:

	es la distancia inclinada corregida
	es la distancia inclinada medida
	es un índice de refracción preconfigurado del grupo para la portadora del instrumento MED y las frecuencia de modulación
	es una constante para la longitud de onda portadora del instrumento MED (mm Hg)
	es la presión atmosférica en mm de mercurio
	es la temperatura del aire seco en grados Celsius
NOTA: Trimble recomienda registrar la presión y temperatura en Trimble Survey Controller. Esta corrección se aplica a la(s) distancia(s) inclinada(s) al importar el archivo .dc.

NOTA:  En el software 3600/5600 Zeiss Elta, 3600/5600 GDM, y TDS Survey Pro, las correcciones de presión y temperatura se aplican en el instrumento. Por lo tanto, las observaciones ya se han corregido antes de haber sido importadas a Trimble Geomatics Office.


Colimación vertical

La corrección de colimación vertical es una corrección angular que se aplica directamente al ángulo vertical.

La colimación vertical de un instrumento se establece mediante la observación cuidadosa de un objeto utilizando ambas caras del instrumento. El valor de corrección establecido indica un error constante debido a un posicionamiento ligeramente incorrecto de las cruces del telescopio.

Cuando se haya establecido el error de colimación de un instrumento se almacenará un registro de colimación en el archivo de dispositivo y la colimación vertical se aplicará a todos los ángulos verticales siguientes:

Cara 1:
Cara 2:
Donde:

	es el ángulo vertical corregido
	es el ángulo vertical observado (ángulo cenital)
	es la corrección de colimación vertical. Esta corrección se aplica durante la importación de un archivo de dispositivo.
NOTA: Trimble Survey Controller no tiene un programa de colimación. No se realiza ninguna corrección de colimación durante la importación.

NOTA: En el software 3300/3600/5600 Elta, 3600/5600 GDM y TDS Survey Pro, la colimación vertical se aplica antes de importarla a Trimble Geomatics Office.


Curvatura y refracción

La corrección de curvatura y refracción se aplica al ángulo vertical observado para tener en consideración el efecto de la curvatura de la Tierra y la refracción vertical atmosférica de las trayectorias luminosas.

Donde:

	Es en ángulo vertical cenital corregido
	Es el ángulo vertical cenital observado
	Es la distancia inclinada corregida
	Es el coeficiente de refracción – por lo general 0.142 ó 0.20 según el valor en el registro Trabajo en el archivo de dispositivo
	Es el radio de la Tierra
NOTAS:

  Este formato da un valor en radianes.

  La corrección de curvatura y refracción se aplica durante la importación de un archivo de Trimble Survey Controller.

  En el software 3300/3600/5600 Elta, la curvatura y refracción se aplica en el instrumento. Por lo tanto, las observaciones ya se han corregido antes de importarlas a Trimble Geomatics Office.

  En el software 3600/5600GDM, la curvatura y refracción se aplica a coordenadas calculadas.  Las observaciones brutas se importan y corrigen en Trimble Geomatics Office.

  En el software TDS Survey Pro, la corrección de curvatura y refracción se aplica durante la importación a Trimble Geomatics Office.


Colimación horizontal

NOTA: Trimble Survey Controller no tiene un programa de colimación. No se realiza ninguna corrección de colimación durante la importación.

Si se encuentra un registro de colimación, Trimble Geomatics Office aplica la colimación horizontal de acuerdo con la siguiente fórmula:

Cara 1:
Cara 2:
Donde:

	es el ángulo horizontal corregido
	es el ángulo horizontal observado
	es la corrección de colimación horizontal

Cuando se requiera esta corrección de colimación, la misma se aplicará durante la importación de un archivo de colector de datos.

NOTA: En el software 3300/3600/5600 Elta, 3600/5600 GDM y TDS Survey Pro, la colimación horizontal se aplica antes de importarla a Trimble Geomatics Office.


Orientación horizontal

 Véase también

Los ángulos horizontales terrestres están orientados durante el recálculo utilizando el acimut a la referencia. El ángulo horizontal se añade al acimut y el resultado se agrega al punto de la visual hacia adelante. Esto orienta todas las observaciones para la configuración.

El acimut con respecto al punto de referencia se determina utilizando las siguientes reglas (para observaciones convencionales solamente):

  Si solamente se conoce la posición del punto del instrumento y del punto de referencia (es decir, no hay un acimut tecleado), el recálculo utiliza el acimut de referencia determinado del inverso entre los dos puntos.

  Si solamente hay un acimut tecleado disponible y el punto “al” no tiene una coordenada, el recálculo lo empleará como el acimut de referencia.

  Si se conocen ambas posiciones del punto del instrumento y del punto de referencia y hay un acimut tecleado disponible, el recálculo determinará la calidad de cada acimut y utilizará la jerarquía en la tabla de más adelante para determinar el acimut a utilizar como el acimut de referencia.

Por ejemplo, si existe un par de puntos de referencia y del instrumento de calidad topográfica, junto con el acimut tecleado de calidad de control, el acimut tecleado se usará para el acimut de referencia.

NOTA: Para calcular la calidad del acimut de referencia, se examinará la calidad horizontal del punto del instrumento y del punto de referencia y se tomará el punto de calidad más baja. Por ejemplo, si el punto del instrumento tiene una calidad de control y el punto de referencia tiene una calidad topográfica, el acimut de referencia tendrá una calidad cartográfica.

Tipo	Calidad
Derivado de coordenadas	Control
Acimut tecleado	Control
Derivado de coordenadas	Topográfica
Acimut tecleado	Topográfica
Derivado de coordenadas	Cartográfica
Acimut tecleado	Cartográfica

NOTA: Si quiere que un recálculo utilice el acimut tecleado en lugar del acimut determinado entre el punto de referencia y del instrumento, incremente la calidad de la posición del acimut tecleado para que sea más alta en la jerarquía que el acimut determinado entre el instrumento y el punto de referencia.

SUGERENCIA: La calidad de un acimut tecleado se podrá editar.


Angulos horizontales

 Véase también

Para las observaciones terrestres, Trimble Geomatics Office almacena ángulos horizontales no orientados entre dos puntos. Los ángulos se orientan durante el recálculo.

Durante la importación, el ángulo horizontal se determina por:

Donde:

	es el ángulo horizontal almacenado en Trimble Geomatics Office
	es la observación horizontal observada con respecto al punto anterior
	es la observación horizontal observada con respecto al punto de referencia
El valor ObsREF está almacenado en el registro BKB en el archivo de dispositivo. (El registro BKB es un tipo de registro en un archivo .dc que tiene el registro de referencia).

Si no hay un registro de referencia, Trimble Geomatics Office trata al primer punto observado como el punto de referencia.


Reducción de distancia inclinada

 Visión de conjunto

Para cada observación terrestre, Trimble Geomatics Office reduce la distancia inclinada a los componentes horizontal y vertical durante un recálculo.

Se utilizan las dos fórmulas siguientes:

Donde:

	es la distancia horizontal en la elevación del punto de origen
	es la diferencia en altura entre los puntos origen y destino
	es la distancia inclinada (tras las correcciones observacionales)
	es el ángulo vertical (cenital)
Consulte el diagrama de reducción. El diagrama clarifica los valores utilizados en las dos fórmulas anteriores.


Corrección del nivel del elipsoide

La corrección del nivel del mar (o corrección del nivel del elipsoide) se aplica a la distancia horizontal calculada. Para ver si se han aplicado correcciones del nivel del mar, seleccione Archivo / Propiedades proyecto / ficha Recalcular.

Esta corrección reduce una distancia horizontal a la distancia que se hubiera medido al nivel del elipsoide (no al nivel geoidal, es decir, al nivel del mar). Esta diferencia no es importante con la reducción.

Si la casilla de verificación de las correcciones del nivel del elipsoide está seleccionada, las observaciones terrestres se aplican junto con el elipsoide local. Si dicha casilla está inhabilitada, las observaciones terrestres se aplican junto al terreno.

La fórmula de corrección del nivel del elipsoide es la siguiente:

Donde:

	Es el radio de la Tierra
Consulte el diagrama de reducción. El diagrama clarifica los valores utilizados en la fórmula anterior.

NOTA: La corrección del nivel del elipsoide no se aplica en un trabajo de factor de escala solamente. Cuando se importa un archivo de factor de escala solamente, la corrección del nivel del elipsoide en Trimble Geomatics Office se inhabilitará automáticamente a menos que haya seleccionado la casilla de verificación Usar coordenadas terrestres en el diálogo Configs ajuste local.


Radio de la Tierra

En Trimble Geomatics Office, el radio de la Tierra se calcula utilizando la latitud y el elipsoide del proyecto. Si la latitud del proyecto no está definida para el mismo, se utilizará una latitud del proyecto por defecto de 30 grados. Por ejemplo, en el elipsoide WGS-84, con una latitud del proyecto de 30 grados, el valor del radio de la Tierra es de 6383 480.917.

NOTA: Defina la latitud del proyecto antes de importar observaciones terrestres. Si define la latitud del proyecto después de importar datos terrestres, la curvatura y corrección elipsoidal y la corrección de refracción no se volverán a aplicar utilizando el nuevo radio de la tierra calculado.

Para definir la latitud del proyecto:

1.	Seleccione Archivo / Propiedades proyecto. Aparecerá el diálogo Propiedades proyecto.

2.	Seleccione la ficha Sistema de coordenadas.

3.	En el grupo Configs ajuste local, haga clic en Cambiar.

4.	En el grupo Ubicación proyecto, introduzca la latitud del proyecto.


Observaciones convencionales - Visión de conjunto
Observaciones convencionales − Visión de conjunto

Trimble Geomatics Office soporta puntos observados utilizando instrumentos topográficos convencionales. Dichos puntos se denominan observaciones convencionales.

En el software Trimble Geomatics Office podrá:

  importar observaciones convencionales.

  importar observaciones de telémetros de láser

  importar archivos de nivel digital


Reducción de observaciones convencionales

La operación recalcular de Trimble Geomatics Office utiliza las mediciones de distancia y ángulos observados para calcular coordenadas para puntos observados convencionalmente.

Importar

Durante la importación de archivos, se aplican las siguientes correcciones:

  Corrección de presión y temperatura, aplicada a la distancia inclinada.

  Curvatura y refracción, aplicadas al ángulo vertical.

  Angulo horizontal, reduce las observaciones horizontales a ángulos horizontales del punto de referencia. Las lecturas de la cara dos se almacenan como lecturas de la cara uno.

  Correcciones de la excentricidad de montaje del equipo de medición electrónica de distancias (MED).

  Colimación horizontal

  Colimación vertical

Recálculo

Durante un recálculo, se aplican las siguientes correcciones:

  Corrección del elipsoide

  Orientación horizontal

  Constante prisma


Diagrama de reducción

En estas correcciones, el diagrama siguiente clarifica los valores utilizados en las fórmulas:

Donde:

	es el ángulo vertical (cenital)
	es la distancia inclinada (tras las correcciones observacionales)
	es la elevación del punto de origen sobre el elipsoide
	es la diferencia en altura entre los puntos de origen y de destino
	es la distancia horizontal en la elevación del punto de origen
	es la cuerda en el nivel del mar (o nivel elipsoidal)
	es la distancia del nivel del mar (elipsoide)


Observaciones convencionales - Observaciones de dos caras
Observaciones convencionales − Observaciones de dos caras

Las observaciones de la cara 2 se convierten y almacenan en la base de datos como observaciones de la cara uno. Para seleccionar una observación, use la ventana Propiedades. Se mostrará la cara (uno o dos).

Si hay observaciones de Cara 1 y Cara 2 de y a los mismos puntos, entonces las observaciones de Cara 1 y Cara 2 se promediarán e importarán como una observación. El tipo de observación se mostrará como la media.


Observaciones convencionales - Poligonal
Observaciones convencionales – Poligonal

Al utilizar el software Trimble Survey Controller, TDS Survey Pro o 3600/5600 Elta se puede calcular un error de cierre poligonal para las observaciones convencionales y ajustar la poligonal.

Si ha ajustado una poligonal y desea cambiar los valores, siga estos pasos:

1.	Seleccione el punto para el que desea cambiar las coordenadas.

2.	Abra la ventana Propiedades y amplíe el punto utilizando la estructura arbórea.

3.	Compruebe si ya hay una cuadrícula o coordenada local para el punto. Si no la hay, añada una coordenada utilizando la herramienta botón Añadir coordenada [image].

4.	Haga clic en los campos de coordenadas e introduzca los valores de coordenadas conocidas.

5.	En los Controles del selector de calidad junto a los campos de coordenadas, seleccione la opción Calidad control en la lista desplegable. La calidad debe ser topográfica o superior para usarla en lugar de la observación.

6.	Haga clic en Aceptar.

7.	Presione F4 para realizar un recálculo de los datos topográficos.

El recálculo determina los errores de cierre entre las coordenadas conocidas y las observadas.

Los errores de cierre se mostrarán en el Informe de recálculo. Si no desea ver los errores de cierre, entonces inhabilite la observación.

Para ver los errores de cierre, realice una de las siguientes acciones:

  Seleccione Informes / Informe de recálculo.

  Haga clic en el botón de página Advertencia [image] en la ventana Propiedades y seleccione la herramienta Derivación de puntos [image].

  Haga clic en el botón de página Resumen [image] en la ventana Propiedades y seleccione la herramienta Derivación de puntos [image].


Observaciones de telémetros de láser - Visión de conjunto
Observaciones de telémetros de láser − Visión de conjunto

Trimble Geomatics Office soporta puntos observados utilizando telémetros de láser con Trimble Survey Controller versión 7.00 ó posterior. Consulte información sobre los telémetros de láser que soporta Trimble Survey Controller en el Manual de referencia de Trimble Survey Controller.

La manera en que se muestran las observaciones de telémetros de láser depende de la configuración de visualización en la ventana Propiedades.

En Trimble Geomatics Office podrá:

  Importar archivos Survey Controller (*.dc) que contienen observaciones de telémetros de láser. (Los puntos de telémetros de láser observados se importan a Trimble Geomatics Office de la misma forma que los puntos convencionales.)

  Ver observaciones de telémetros de láser en la ventana Propiedades.

  Seleccionar e informar observaciones de telémetros de láser.


    Observaciones de telémetros de láser - Visualización

Las observaciones de telémetros de láser se muestran en la Vista del levantamiento. El color en que se muestran depende del fondo configurado en la ficha Ver / Opciones / Leyenda topográfica.

SUGERENCIA: Elija Seleccionar / Por consulta y use la opción Puntos de telémetro de láser para seleccionar todos los puntos de telémetro de láser en la base de datos. Los puntos de telémetro de láser tienen una observación de telémetro de láser.

Para ver un punto observado utilizando un telémetro de láser:

1.	En la Vista del levantamiento, abra la ventana Propiedades.

2.	Seleccione una observación de telémetro de láser.

Use los botones de menú o el Menú Página detallado para ver los siguientes detalles de observación de telémetro de láser:


Parámetros de transformación de calibración y ajuste

 Cómo ...

Cuando se realiza una Calibración local GPS, se calculan los parámetros de calibración que establecen la relación entre puntos WGS-84 (Puntos GPS) y posiciones de la cuadrícula local en la base de datos.

Cuando se realiza un ajuste de red limitado (si tiene el módulo Network Adjustment (Ajuste de la red) instalado), se calculan los parámetros de transformación. Estos parámetros establecen la relación entre las observaciones y el control fijo.

Trimble Geomatics Office sólo acepta parámetros de ajuste horizontal y vertical derivados de una calibración local GPS o parámetros de transformación de ajuste derivados de un ajuste. Si ha realizado un ajuste. Si ha realizado un ajuste y ha calculado los parámetros de transformación de ajuste y luego trata de realizar una calibración local GPS, se le advertirá que los parámetros se quitarán si continúa con la calibración.

NOTA: Los parámetros de transformación de ajuste derivados de un ajuste no se pueden transferir a Trimble Survey Controller. Para hacerlo, tiene que realizar una calibración local GPS utilizando coordenadas de calibración guardadas (como puntos WGS-84) derivadas de un ajuste mínimamente limitado y coordenadas ajustadas (como puntos de cuadrícula) derivadas de un Ajuste de la red limitado.


Referencias

Libros

Barry, B. Austin. 1991. Errors in Practical Measurement in Surveying, Engineering, and Technology. Editado por M. D. Morris. ISBN 0-910845-47-6. Rancho Cordova: Landmark Enterprises.

Hofmann-Wellenhof, B., Herbert Lichtenegger, y James Collins. 1993. Global Positioning System Theory and Practice. Segunda edición. ISBN: 3-211-82477-4 y ISBN 0-387-82477-4. Nueva York: Springer-Verlag Wien.

Leick, Alfred. 1995. GPS Satellite Surveying. Segunda edición. ISBN: 0-471-30626-6. Nueva York: John Wiley and Sons, Inc.

Pope, Allen J. 1976. The Statistics of Residuals and the Detection of Outliers. NOAA Technical Report NOS65 NGS1, Rockville, MD.

Seeber, Günter. 1993. Satellite Geodesy, Foundations, Methods, and Applications. ISBN: 3-11-012753-9. Berlín y Nueva York: Walter deGruyter.

U.S. National Geodetic Survey (NGS). 1986. Geodetic Glossary. Silver Spring, MD: NGS Publications Information Center.

Van Sickle, Jan. 1996. GPS for Land Surveyors. ISBN 1-575-04041-7. Ann Arbor: Ann Arbor Press, Inc.

Wolf, Paul R. y Charles D. Ghilani. 1997. Adjustment Computations: Statistics and Least Squares in Surveying and GIS. ISBN: 0471-16833-5. Nueva York: John Wiley and Sons, Inc.

Otros recursos - publicaciones / revistas en Estados Unidos

Las siguientes publicaciones son fuentes de información útiles sobre ingeniería civil y otros temas topográficos:

ACSM Bulletin. ISSN: 0747-9417. Publicado cada dos meses por el American Congress on Surveying and Mapping, 5410 Grosvenor Land, Suite 100, Bethesda, MD 20814-2144 EE.UU.

GPS World: News and Applications of the Global Positioning System. ISSN: 1048-5104.Publicado mensualmente por Advanstar Communications Inc. Oficinas de suscripción: P.O. Box 6148, Duluth, MN 55806-6148 EE.UU.

P.O.B. - Point of Beginning. ISSN: 0739-3865. Publicado mensualmente por Business News Publishing Company, 755 W. Big Beaver Road, Ste. 1000, Troy, MI 48084 EE.UU.

Professional Surveyor. ISSN: 0278-1425. Publicado diez veces al año por Professional Surveyors Publishing Company, Inc., 1713-J Rosemont Avenue, Frederick, MD 21702-4170 EE.UU.


El navegador de zoom

El navegador de zoom se muestra como una pequeña ventana en la parte inferior de la barra de proyectos y refleja los datos visualizados en la ventana gráfica principal de Trimble Geomatics Office. Si usted utiliza cualquiera de las herramientas de zoom de la ventana principal, el cuadro del navegador de zoom cambia para reflejar dicha herramienta. Siempre se visualiza la extensión o alcance de su proyecto.

Ocultar (o mostrar) el navegador de zoom

Para ocultar (o mostrar) el navegador de zoom en la barra de Trimble Geomatics Office:

1.	En la barra de proyectos, haga clic en el botón derecho del ratón para acceder al menú de acceso directo.

2.	Seleccione el Navegador de zoom.

Utilización del Navegador de zoom

Para utilizar el navegador de zoom:

  Haga clic en una zona del proyecto en el navegador de zoom.

NOTA: Esta zona se convierte en el centro de la ventana gráfica principal.

Para utilizar el navegador de zoom para efectuar un zoom:

1.	En el navegador de zoom, arrastre un cuadro en la zona de interés.

La ventana gráfica principal refleja los mismos datos.

2.	Cuando apunte a la mitad del navegador de zoom, el puntero se convierte en [image]. Esto significa que usted puede arrastrar el cuadro sobre la zona proyecto sin cambiar el zoom. La vista del proyecto de la ventana gráfica principal refleja estos movimientos.

  Para efectuar un alcance del zoom, haga doble clic en el navegador de zoom.

NOTA: Si tiene un ratón con una rueda, puede utilizar al rueda para cambiar el tamaño del cuadro del navegador de zoom.


Barra de proyectos - Visión de conjunto

La barra de proyectos está formada por grupos con nombres que listan los métodos de acceso directo a las tareas más frecuentemente utilizadas en Trimble Geomatics Office. Cada acceso directo está disponible en un menú.

Para acceder rápidamente a una tarea:

1.	Haga clic en un acceso directo de la barra de proyectos.

2.	Haga clic en grupo para desplazarse a un conjunto diferente de accesos directos.

Para cambiar el tamaño de los iconos de acceso directo:

1.	Haga clic en el botón derecho del ratón en la zona de la barra de proyectos.

Aparece un menú de acceso directo.

2.	Seleccione la opción Iconos grandes o Iconos pequeños.

Para ocultar (o mostrar) la barra de proyectos, realice uno de los siguientes pasos:

Haga clic en el botón derecho del ratón en la zona de la barra de proyectos.

Aparece un menú de acceso directo. Seleccione Ocultar.

Seleccione Ver / Barra de proyectos

En la barra de herramientas, haga clic en el icono de la barra de proyectos.

Cuando no hay ningún proyecto abierto, los grupos Proyectos y Utilidades están disponibles. Cuando hay un proyecto abierto, está disponible la lista completa de grupos (a excepción del grupo Utilidades):

  Grupo Trimble Survey

  Grupo de proyectos

  Grupo para importar

  Grupo de procesos (si tiene instalado el módulo WAVE Baseline Processing [Procesamiento de líneas base WAVE] de Trimble)

  Grupo de ajustes (si tiene instalado el módulo Network Adjustment [Ajuste de la red] Trimble)

  Grupo para exportar

  Grupo CAD

  Grupo de utilidades


Barra de proyectos - Grupo de Trimble Survey

Este grupo contiene accesos directos que proporcionan el acceso rápido a las tareas más frecuentemente utilizadas en la vista de levantamiento. Los accesos directos generalmente se listan en el orden en que se utilizan:


Barra de proyectos - Grupo de proyectos

Este grupo contiene los accesos directos que proporcionan el acceso rápido a los comandos del proyecto:


Barra de proyectos - Grupo para importar

Este grupo contiene los accesos directos que proporcionan el acceso rápido para la importación de fuentes de datos topográficos comúnmente utilizadas:


Barra de proyectos - Grupo de procesos

Este grupo contiene los accesos directos que proporcionan el acceso rápido a tareas de procesamiento de líneas base comúnmente utilizadas:

NOTA: Debe tener instalado el módulo Baseline Processing.


Barra de proyectos - Grupo de ajustes

Este grupo contiene los accesos directos que proporcionan el acceso rápido a tareas de ajuste comúnmente utilizadas:

NOTA: Debe tener instalado el módulo Network Adjustment.


Barra de proyectos - Grupo para exportar

Este grupo contiene los accesos directos que proporcionan el acceso rápido para la exportación de datos del proyecto a formatos de datos comúnmente utilizados:


Barra de proyectos - Grupo CAD

Este grupo contiene los accesos directos que proporcionan el acceso rápido a tareas comúnmente utilizadas en la vista del plano:


Barra de proyectos - Grupo de utilidades

Este grupo contiene los accesos directos que proporcionan el acceso rápido a las tareas comúnmente utilizadas que se incluyen en el sistema Trimble Geomatics Office.


Atributos - Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Un atributo consiste en información descriptiva sobre un código de característica. Por ejemplo, con el código de característica de árbol se pueden tener los siguientes atributos: especie, altura, circunferencia, y condición. Cada código de característica de árbol que se capture en el campo tendrá sus propios valores para estos atributos.

Trimble Geomatics Office soporta la gestión de información de atributos con puntos. Con este software usted puede:

  usar la utilidad Feature and Attribute Editor™ de Trimble ( Editor de características y atributos de Trimble), para crear bibliotecas de características y atributos que contengan definiciones de atributo.

  importar archivos de Survey Controller (*.dc) que contengan atributos

  ver y editar información de atributo

  añadir atributos

  exportar los datos a un formato de Sistema de Información Geográfica (GIS)

  generar un informe de atributos

Use la utilidad Feature and Attribute Editor para definir el conjunto de atributos de un código de característica. Para cada atributo, debe definirse un nombre y tipo. El tipo de atributo determina el formato de la información de atributo. Por ejemplo, si el atributo de un árbol es la altura, el tipo de atributo es ‘numérico’.

También puede utilizar archivos (*.ddf) de diccionario de datos para capturar información de atributo. Para crear archivos .ddf, use la utilidad  Data Dictionary Editor de Trimble (Editor de diccionarios de datos de Trimble) . Esta forma parte del conjunto de software GPS Pathfinder®  Office.

Procedimiento

El procedimiento para la gestión de información de atributo con Trimble Geomatics Office consiste en:

1.	Crear un archivo de biblioteca de características y atributos (*.fcl) en el Feature and Attribute Editor.

2.	En Trimble Geomatics Office, configurar el proyecto con atributos al seleccionar los archivos .fcl o .ddf.

3.	Transferir los archivos .fcl o .ddf a Trimble Survey Controller (versión 7.00 ó posterior).

4.	Capturar los datos en el campo.

5.	Transferir los datos de campo a Trimble Geomatics Office.

6.	Exportar los datos en un formato GIS o un formato ascii personalizado.


Biblioteca de características y atributos -  Visión de conjunto

Más información

 Cómo ...

Visión de conjunto

Un archivo de biblioteca de características y atributos (*.fcl) es un archivo de texto que contiene definiciones de códigos de característica, atributos, estilos CAD, y códigos de control. Para editar bibliotecas de características y atributos, use la utilidad Feature and Attribute Editor de Trimble (Editor de características y atributos de Trimble).

Las bibliotecas de características y atributos son un conjunto de instrucciones que describen las operaciones a efectuar en el procesamiento de códigos de característica. Por ejemplo:

  para asignar un estilo de punto concreto a un punto

  para crear líneas entre puntos

  para definir atributos a capturar en el campo

  para anotar puntos y líneas

Para obtener más información sobre la creación de bibliotecas de características y atributos, véase la ayuda en pantalla del Feature and Attribute Editor de Trimble.

Utilice un archivo de biblioteca de características y atributos (*.fcl) para:

  procesar códigos de característica

  definir atributos para la captura de datos en el campo

Procesamiento de códigos de características

Para obtener información sobre la utilización de bibliotecas de características y atributos en el procesamiento de códigos de característica, véase el tema Códigos de característica  − Visión de conjunto.

Atributos

Para configurar un proyecto con atributos, use el diálogo Propiedades proyecto. Puede seleccionar un archivo de biblioteca de características y atributos (*.fcl) o un archivo de diccionario de datos (*ddf).


Configuración de un proyecto con atributos

 Visión de conjunto y más información

Para utilizar atributos en Trimble Geomatics Office, usted debe configurar un proyecto con atributos. Para ello, seleccione el archivo de biblioteca de características y atributos (*.fcl) o el archivo de diccionario de datos (*.ddf) que quiera utilizar.

SUGERENCIA: Para obtener más información sobre cómo seleccionar un archivo .fcl o uno .ddf, véase el tema Configurar un proyecto con atributos.

Trimble Geomatics Office crea una tabla para todos los códigos de característica con atributos. El archivo de biblioteca no se almacena en el proyecto. Esto significa que el proyecto no se actualiza si se efectúan cambios en la biblioteca.

Modificación de la biblioteca de características y atributos del proyecto

Para cambiar la biblioteca de características y atributos del proyecto, selecciónela tal como se ha descrito anteriormente. Sin embargo, Trimble Geomatics Office no le deja hacerlo después de:

  importar un archivo de Survey Controller (*.dc) que contenga atributos

  añadir un registro de atributo en Trimble Geomatics Office

Esto se debe a que las tablas de características existentes se han eliminado, y se crean tablas nuevas con la biblioteca seleccionada.

Si realmente necesita cambiar la biblioteca de características y atributos de un proyecto, usted puede eliminar todos los puntos con atributos, volver a abrir el proyecto, y entonces seleccionar una biblioteca de características y atributos nueva.

Trimble Survey Controller

Asegúrese de que el archivo de biblioteca de características y atributos (o el archivo de diccionario de datos) utilizado en Trimble Geomatics Office es el mismo que el empleado en Trimble Survey Controller. Si utiliza bibliotecas diferentes, es probable que no se importen todos los datos de atributo.

Para obtener información sobre la importación de datos con atributos de bibliotecas diferentes, véase Importación de atributos con definiciones diferentes.


Archivos de diccionario de datos - Visión de conjunto

Más información

 Véase también

Visión de conjunto

Un archivo de diccionario de datos define las características y los atributos asociados a las mismas.

Puede utilizarse como método alternativo al archivo de biblioteca de características y atributos.

Si usted tiene el Data Dictionary Editor (que forma parte del conjunto de GPS Pathfinder Office), podrá utilizarlo para crear archivos de diccionario de datos (*.ddf). El archivo .ddf contiene definiciones de características y atributos.

Utilización de un archivo .ddf para configurar un proyecto con atributos

Usted puede utilizar un archivo .ddf para configurar un proyecto Trimble Geomatics Office con atributos. Si lo hace, todas las características de línea o de área del archivo .ddf se tratarán como características de punto. Esto se debe a que Trimble Geomatics Office y Trimble Survey Controller (versión 7.00 ó posterior) sólo soportan características de punto.

Utilización de un archivo .ddf en Feature and Attribute Editor

NOTA: La biblioteca de características y atributos utilizada para la configuración de un proyecto con atributos no tiene que ser la misma que la empleada en el procesamiento de códigos de característica. No obstante, si se capturan datos de atributo en el campo utilizando un archivo de biblioteca de características y atributos, deberá emplearse el mismo en el procesamiento de los códigos de característica.

Usted puede importar archivos .ddf a archivos de biblioteca de características y atributos (*.fcl) usando la utilidad Feature and Attribute Editor. También puede exportarse un archivo .fcl como un archivo .ddf. Estas tareas resultan útiles si desea utilizar archivos .ddf con la utilidad Data Dictionary Editor (Editor de diccionarios de datos).

Utilización de un archivo .ddf en Trimble Survey Controller

Usted puede utilizar un archivo .ddf en el campo como una biblioteca para definir atributos. Para ello, transfiera un archivo .ddf a Trimble Survey Controller.


Importación de atributos con definiciones diferentes

 Visión de conjunto y más información

Cuando importe un archivo de Survey Controller (*.dc) que contenga atributos, las definiciones de atributo del archivo .dc se comparan con las de los atributos del proyecto. Si difieren en algo, se muestra un diálogo que le pregunta lo siguiente:

  si quiere importar información de atributo común a ambos archivos de biblioteca de características y atributos o de diccionario de datos.

Si selecciona esta opción y usted cambió alguna definición de atributo en el archivo de biblioteca de características y atributos del proyecto, después de transferir el archivo a Trimble Survey Controller, perderá la información de atributo de dicho código de característica. Si sólo añadió nuevos códigos de característica, no se perderá ningún dato.

  si quiere insertar puntos con códigos de característica pero sin información de atributo

  si quiere cancelar la importación

Para evitar que este mensaje se muestre de nuevo, asegúrese de que el archivo utilizado para configurar el proyecto con atributos es el mismo que el utilizado en Trimble Survey Controller.


Visualización/Edición de atributos en Trimble Geomatics Office

 Visión de conjunto y más información

Para ver y editar los atributos de punto de Trimble Geomatics Office, use la ventana Propiedades. Si ha configurado un proyecto con atributos en el diálogo Propiedades proyecto, en la ventana Propiedades se muestra la ficha Atributo. Si el punto seleccionado tiene varias características con atributos, use la lista desplegable para seleccionar la característica sobre la que quiere ver atributos. Para editar un valor de atributo, haga clic en el campo apropiado de la columna Valor.

Para atributos de menú:

  Seleccione un valor de la lista de valores de atributo disponibles.

Para todos los otros tipos de atributo:

  Introduzca ,con el teclado, el nuevo valor para el atributo. No puede utilizarse Rellenar campo con los atributos.

NOTA: Cuando se edite información de atributo, Trimble Geomatics Office comprueba la definición de biblioteca de características y atributos para asegurarse de que el nuevo valor es válido.


Copia/Corte/Pegado de puntos con atributos entre proyectos

 Véase también

Para copiar, o cortar y pegar puntos con atributos, las bibliotecas de características y atributos utilizadas en la configuración de los dos proyectos deben ser iguales.

Si las bibliotecas de características y atributos son diferentes, pero tienen definiciones de atributo comunes, el software le avisará y dará la opción de cancelar el pegado, pegar sólo puntos (sin atributos), o pegar puntos con atributos comunes a ambas bibliotecas. Trimble Geomatics Office registra los atributos que no se pegaron en el informe Import.rpt.

Si el proyecto ya contiene puntos con atributos usted no podrá seleccionar una biblioteca diferente para configurar el proyecto con atributos. Esto es debido a que las definiciones de atributo ya están especificadas. No obstante, usted puede crear un proyecto nuevo, definir definiciones de atributo nuevas en la biblioteca de características y atributos (o en el archivo de diccionario de datos), y a continuación copiar los puntos con atributos del proyecto existente en el nuevo proyecto.

NOTA: La copia o corte y pegado sólo se puede realizar si es verdad que:

  todos los puntos a copiar o a cortar tienen elevaciones

o si

  se ha especificado una elevación por defecto para el proyecto. Este valor se utiliza con todos los puntos con elevaciones nulas.

Esto es debido a que las coordenadas de los puntos a copiar/cortar se reducen al elipsoide WGS-84. El sistema de coordenadas del proyecto en el que se está pegando se aplica a los puntos pegados. Si este proyecto contiene un sistema de coordenadas diferente, se mostrarán las coordenadas correctas.


Diferencias existentes entre los archivos .fcl y los .ddfDiferencias existentes entre los archivos .fcl y los .ddf
Diferencias existentes entre los archivos .fcl y los .ddf

Usted puede utilizar un archivo de biblioteca de características y atributos (*.fcl) o uno de diccionario de datos (*.ddf) en el proyecto de Trimble Geomatics Office. Para seleccionar un archivo para el proyecto actual, seleccione Archivo / Propiedades proyecto / ficha Características. Las diferencias existentes entre ambos archivos se describen a continuación:

Archivos .fcl

Un archivo .fcl puede contener configuraciones CAD (tales como estilos de punto, estilos de línea, estilos de anotación, y códigos de control), para la codificación de características así como para las definiciones de atributo. Cuando seleccione un archivo .fcl para configurar un proyecto con atributos, Trimble Geomatics Office utiliza las definiciones de atributo para crear las tablas requeridas.

El mismo proceso se produce si se decide exportar un archivo .fcl con atributos a Trimble Survey Controller (versión 7.00 ó posterior).

Si quiere utilizar códigos de característica y capturar atributos, use los archivos .fcl. Si ya se tiene un archivo .ddf pero quiere códigos de característica, puede importar el archivo .ddf a un archivo .fcl en la utilidad Feature and Attribute Editor y a continuación utilizar el archivo .fcl.

Para obtener más información, véase la ayuda de Feature and Attribute Editor.

Archivos .ddf

Un archivo .ddf no puede contener configuraciones CAD para la codificación de características. Simplemente contiene definiciones de características y atributos. Si usted va a procesar códigos de característica de un archivo .ddf, no se asignará ningún estilo de punto, línea, o anotación.

El archivo .ddf puede crearse desde la utilidad Data Dictionary Editor (si tiene GPS Trimble Pathfinder Office) o desde Feature and Attribute Editor en Trimble Geomatics Office. (Seleccione Archivo / Exportar en el Feature and Attribute Editor para exportar un archivo .ddf.)


Transferencia de datos - Visión de conjunto
Transferencia de datos − Visión de conjunto

La utilidad Data Transfer (Transferencia de datos) de Trimble es el software utilizado para transferir datos entre Trimble Geomatics Office y un dispositivo. Este último puede ser un controlador topográfico, un receptor GPS de Trimble, un colector de datos de formato SDR, un nivel digital, una unidad de control o una tarjeta PC. Antes de que se puedan transferir datos usando esta utilidad, necesitará instalar el dispositivo requerido.

Si ya lo tiene instalado, para acceder a la utilidad Data Transfer desde Trimble Geomatics Office, realice uno de los siguientes pasos:

1.	Seleccione Archivo / Importar o Archivo / Exportar, dependiendo de lo que quiera hacer. Aparecerá el diálogo correspondiente.

2.	Seleccione la opción requerida.

Para abrir la utilidad Data Transfer, seleccione la opción que requiera la conexión a un dispositivo.

Aparece el diálogo Guardar como o Abrir, dependiendo de lo que haya elegido.

3.	Seleccione el dispositivo que se va a quiere utilizar en la transferencia de datos.

Acceso a la utilidad Data Transfer sin utilizar un proyecto

Si no hay ningún proyecto abierto, puede transferir archivos entre la computadora y un dispositivo.

Para ello:

  	Desde Trimble Geomatics Office, seleccione Utilidades / Transferencia de datos.

Acceso a la utilidad Data Transfer sin utilizar Trimble Geomatics Office

Usted puede transferir archivos desde la computadora a un dispositivo sin utilizar Trimble Geomatics Office.

Para ello:

  	Seleccione Inicio / Programas / Transferencia de datos.


Dispositivos - Visión de conjunto
Dispositivos − Visión de conjunto

Para transferir datos entre un proyecto de Trimble Geomatics Office y un dispositivo, deberá configurar el dispositivo de forma correcta.

Cuando configure el dispositivo, éste siempre estará disponible durante la importación o exportación. Para obtener más información, vea la ayuda de la utilidad Data Transfer.


Diálogo Comprobar DAT

Utilice este diálogo para comprobar los valores del/os archivo/s GPS antes de importar las observaciones GPS a un proyecto del software Trimble Geomatics Office.

NOTA: Las modificaciones efectuadas en el diálogo sólo se aplican a los datos importados. Los cambios no afectan al archivo de datos GPS (*.dat).

El diálogo aparece cuando se importa:

  Archivos de datos GPS (*.dat)

  Archivos RINEX (*.XXo, *.XXn, *.obs, *.nav)

Usar

Inhabilite esta casilla de verificación si no quiere que los datos se transfieran al proyecto.

Nombre

Muestra el nombre del punto donde los datos han sido observados. Si al punto del archivo no se le ha asignado un nombre, se utiliza el ID de estación. Utilice el teclado para introducir un nombre y cambiar este campo.

Nombre de archivo

Muestra la fuente del archivo de los datos.

Tiempo de inicio

Muestra la hora y fecha de inicio de la ocupación.

Tiempo de parada

Muestra la hora y fecha de parada de la ocupación.

Alturas de antena

Visualiza la altura de antena introducida para la ocupación. Si la altura se introdujo incorrectamente durante la ocupación, utilice el teclado para introducir un valor y cambiar este campo.

Tipo de antena

Visualiza el tipo de antena conectada al receptor. Si la antena se introdujo incorrectamente durante la ocupación, seleccione un tipo de antena de la lista para cambiar este campo.

Medido a

Visualiza hacia donde fue medida la altura de antena. Si el método ha sido introducido durante la ocupación seleccione una opción de la lista para cambiar este campo.

Código característica

Visualiza el valor del código de característica asignado al punto. Para cambiar este campo utilice el teclado e introduzca un valor nuevo.

Restaurar

Haga clic en Restaurar para restaurar las configuraciones originales.

SUGERENCIA: Para aplicar los mismos cambios a varios puntos, mantenga presionada Ctrl y seleccione los campos requeridos en la columna que quiere cambiar. Presione Mayús si quiere seleccionar filas en serie. Introduzca o elija un valor del campo seleccionado que quiere aplicar a todos los campos de la selección.


Diálogo Importar nivel digital

 Véase También

Use el diálogo Importar nivel digital para:

  Visualizar los datos de un archivo de nivel digital

  Determine los puntos entre los que desea calcular los incrementos de elevación

  Convalide la elevación del punto de inicio.

  Determinar errores de cierre en los puntos conocidos.

  Valide los nombres de los puntos

El diálogo Importar nivel digital aparece cuando importa Archivos de nivel digital (*.dat, *.raw). Para hacer esto:

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	En la ficha de levantamiento, seleccione los archivos de nivel digital (*.dat, *.raw). Aparece el diálogo Abierto.

3.	Seleccione el archivo de nivel digital.

4.	Aparece el diálogo Importar nivel digital.

Cualquier cambio que haga en el diálogo sólo afecta a los datos que han sido importados. Los cambios no afectan el archivo de nivel digital (*.dat, *.raw).

NOTA: Cuando importa datos de un nivel digital, puede especificar cómo se manejarán los puntos duplicados. Por defecto, Trimble Geomatics Office mezcla los puntos con el mismo nombre al importar, por lo que no se crean puntos duplicados. En el diálogo Opciones de puntos duplicados, puede usar la opción Mezclar puntos duplicados dentro de la tolerancia para especificar la tolerancia vertical con la cual se mezclan los puntos duplicados. La tolerancia horizontal no se usa al importar datos de un nivel digital.

NOTA: Los datos se podrán importar directamente de un dispositivo nivel digital DiNi. Al hacerlo, aparecerá el diálogo Importar nivel digital.

SUGERENCIA : Cuando captura datos para importar del nivel digital, almacene los puntos que quiere importar en Trimble Geomatics Office con un prefijo o sufijo distintivo.  Por ejemplo: almacene todos los puntos que quiere utilizar como puntos de estación con el prefijo STN. Esto le permite seleccionar fácilmente los puntos utilizando el botón del filtro Seleccionar según en el diálogo Importar nivel digital o seleccionar puntos que no quiere que sean importados.

En el grupo de Elevación usted puede visualizar los siguientes campos:

Punto de Inicio

El nombre del punto de inicio. El punto de inicio en una serie de nivel, está indicado con el icono Punto de Inicio.

Elevación

La elevación del Punto de Inicio. Usted puede editar la elevación de un punto de inicio cuando el punto es seleccionado en la tabla. Al seleccionar otra serie de nivel en la tabla se visualiza el punto de inicio para esa serie en el grupo de elevación. El final de una serie de nivel y el inicio de otra se visualiza con una línea gruesa de color negro en la tabla.

Calidad de Elevación

La calidad de la elevación de campo. Para cambiar la calidad de elevación haga clic en el botón Calidad.

Los datos en la tabla Nivel digital se muestran en el mismo orden en que se han realizado las observaciones. Puede observar las siguientes columnas:

Columna	Lo que indica
Puntos de estación	El nombre del punto y si el punto ha sido seleccionado como un punto de estación para la importación en Trimble Geomatics Office.  Cuando importa un archivo, todas las observaciones se seleccionarán por defecto. Se puede editar el nombre del punto de estación.
BS	El nivel de observación hacia el sitio del fondo visual hacia la referencia.
IS	El nivel de observación hacia un sitio intermedio. No se puede seleccionar el sitio intermedio de observación hasta que haya seleccionado el correspondiente sitio de observación del fondo.
FS	El nivel de observación hacia el sitio del frente.
Elevación	La elevación de un punto. Se utiliza un icono para indicar el punto que se ha utilizado como el punto de inicio para calcular la elevación.  Este corresponde al punto de inicio que se visualiza en el grupo Elevación.  La elevación del punto de inicio en cada módulo puede ser editada desde el grupo Elevación. Si un punto no tiene una elevación, entonces no se seleccionará un punto de inicio para calcular la elevación de un punto.
Distancia	La distancia hacia el sitio de fondo, sitio de frente, o sitio intermedio .
Descripción	La descripción del punto en nivelación.
Deltas de replanteo	La diferencia en elevación entre un punto que ha sido replanteado y la altura diseñada para el punto de ubicación.

Para seleccionar puntos en la tabla lleve a cabo una de las siguientes acciones:

  Seleccione la casilla en la columna de Punto de estación

  Haga clic en título de la columna. Se puede seleccionar todos los puntos en la tabla haciendo clic en el inicio de la columna y luego seleccionando el primer punto en la columna.

  Haga clic en Seleccionar según Filtro.

Una vez que haya especificado su selección se aplican las siguientes reglas:

  No se puede seleccionar un sitio intermedio antes de que haya sido seleccionado el sitio de fondo.

  Si hay mas de un sitio con el mismo nombre se seleccionarán las demás observaciones (excepto los sitios intermedios) con el mismo nombre.

Cuando haga clic en Seleccionar por filtro aparece el diálogo Definir estaciones de nivel.

NOTA:  Se soportan los siguientes niveles digitales y formatos de almacenamiento:

NOTA: Trimble Geomatics Office no soporta registros de medición Leica que estén registrados fuera de la serie de nivel; esto es, 330 registros.


Diálogo Definir estaciones de nivel

Más Información.

 Véase También

El diálogo Definir estaciones de nivel aparece cuando hace clic en  Seleccionar por filtro en el diálogo Importar nivel digital. Use esta opción de filtro para seleccionar o deseleccionar puntos de estación. Por defecto, todos los puntos de estación son seleccionados en el diálogo Importar nivel digital.

SUGERENCIA: Cuando capture datos para importar del nivel digital, almacene puntos que quiera importar a Trimble Geomatics Office con un prefijo o sufijo distintivo.  Por ejemplo, almacene todos los puntos que quiera usar como puntos de estación con el prefijo STN. Esto le permite seleccionar puntos fácilmente usando el botón Seleccionar según Filtro en el diálogo Importar nivel digital.

Las opciones son:

Seleccionar Puntos con

Utilice esta opción para seleccionar puntos de estación en la columna Puntos de Estación del diálogo Importar nivel digital. Por ejemplo, se puede seleccionar puntos de estación con un prefijo o sufijo particular.

NOTA: Se borrarán aquellos puntos que no tienen un prefijo o sufijo concreto.

Deseleccionar puntos con

Utilice esta opción para inhabilitar la casilla, para puntos particulares, en la columna Puntos de Estación en el diálogo Importar nivel digital.

NOTA:  Se seleccionará aquellos puntos que no tienen un prefijo o sufijo particular.

Nombre

Utilice este campo para seleccionar puntos por su nombre. Se pueden seleccionar nombres de puntos usando ?, * o #  comodines.

Descripción

Utilice este campo para seleccionar puntos por su descripción. Nuevamente, se puede seleccionar la descripción usando comodines.

Ejemplo:

Si usted no desea que los puntos con el prefijo “IS” sean seleccionados en la columna Puntos de estación del diálogo Importar nivel digital:

1.	En el diálogo Definir estaciones de nivel, seleccione los puntos de deselección con opción.

2.	Seleccione la opción Nombre e introduzca IS*.


Utilización de observaciones de nivel en un ajuste de red

Si desea realizar un ajuste de red usando datos de nivel debe tener definidos los errores ecuánimes de observación de nivel definidos. El software calcula errores ecuánimes para los siguientes casos:

  Si importa datos de nivel digital el error típico (incremento de elevación) se calcula usando el número de turnos.

  Usando el formato Trimble Data Exchange, el error ecuánime es calculado si incluye el número de turnos en el formato importar. Como alternativa, el error ecuánime (elevación delta) puede ser usado directamente del archivo.

Si un error ecuánime no está definido, las observaciones de nivel no están marcadas para ajustes.

NOTA: Se puede introducir el error ecuánime o el número de turnos para cada elevación delta en la Ventana de Propiedades.


Diálogo Error en la exportación GIS

Este diálogo aparece cuando falle la exportación GIS.

En la tabla siguiente se muestran algunas de las causas posibles:


Diálogo Seleccionar modelo geoidal - Resolución de problemas
Diálogo Seleccionar modelo geoidal − Resolución de problemas

Este diálogo se muestra durante la importación de un archivo de dispositivo, si el nombre del modelo geoidal referenciado en el archivo no coincide con los nombres del modelo geoidal de la base de datos del sistema de coordenadas (Current.csd). Elija el modelo geoidal que quiere utilizar.

Este diálogo se muestra por una de las causas siguientes:


Falta impresora

Para imprimir o trazar en Trimble Geomatics Office, se necesita tener una impresora instalada en la computadora.

Para instalar una impresora:

1.	Haga clic en Inicio.

2.	Seleccione Configuración / Impresoras. Aparecerá la ventana Impresoras.

3.	Haga doble clic en Agregar impresora.

Siga las instrucciones de instalación indicadas por la configuración de Microsoft Windows.

Una vez instalada la impresora, podrá utilizarla para imprimir desde Trimble Geomatics Office.


Diálogo Seleccionar modelo de la cuad del datum

Este diálogo se muestra si el nombre del archivo de cuadrícula de datum combinado referenciado en el archivo importado no coincide con ninguno de los archivos de cuadrícula de datum de la base de datos de sistemas de coordenadas.

Utilice este diálogo para elegir el archivo de cuadrícula de datum combinado más apropiado a utilizar en el sistema.

Este diálogo se muestra por una de las causas siguientes:


Mensajes y diálogos relacionados con la importación de archivos de Survey Controller (*.dc)

Cuando se importe un archivo de Survey Controller (*.dc) a Trimble Geomatics Office, el software comprueba el archivo y le informa si el archivo .dc y el sistema de coordenadas del proyecto no son iguales.

A continuación se listan los posibles mensajes y diálogos que aparecen cuando se importa un archivo .dc:

  Al importar el archivo se ha(n) generado uno o varios errores

  El archivo de caract. y atributos definido para dicho proyecto es diferente

  No se ha definido un archivo de características y atributos para este proyecto

  No es posible importar el archivo

  Diálogo Definición por defecto de la proyección

  Diálogo Puntos duplicados

  Diálogo Sistema de coordenadas del proyecto

  Diálogo Seleccionar cuadrícula del datum

  Diálogo Seleccionar modelo geoidal


Mensaje - Al importar el archivo se ha(n) generado uno o varios errores

El software encontró uno o varios errores durante la importación del archivo.

Haga uno de los siguientes pasos:

  Para cerrar el mensaje e ignorar los mensajes de error, haga clic en No.

  Para ver los errores, haga clic en Sí.

En el visor HTML predeterminado aparece un informe sobre la importación.

Haga clic en el vínculo de Mensajes de error o desplácese hacia abajo por la sección de errores del informe de importación para examinar los errores.

Si es necesario, solucione los errores y vuelva a importar el archivo.


Mensaje - El archivo de caract. y atributos definido para dicho proyecto es diferente
Mensaje − El archivo de caract. y atributos definido para dicho proyecto es diferente

Durante la importación del archivo de Survey Controller (*.dc), se descubrió que el archivo de biblioteca de características y atributos o el archivo de diccionario de datos utilizado para configurar el proyecto con atributos era diferente del referenciado en el archivo .dc.

Realice uno de los siguientes pasos:

  Haga clic en Sí para importar los atributos comunes al archivo .dc y al proyecto.

  Haga clic en No para importar solamente los puntos del archivo .dc.

Para evitar que este mensaje vuelva a aparecer, asegúrese de que la biblioteca que utiliza es la misma que la empleada en la captura de información de atributo en el campo.


Mensaje - No se ha definido un archivo de características y atributos para este proyecto
Mensaje − No se ha definido un archivo de características y atributos para este proyecto

Durante la importación del archivo de Survey Controller (*.dc) que contiene información de atributo, Trimble Geomatics Office no pudo encontrar un archivo de biblioteca de características y atributos o un archivo de diccionario de datos definido para el proyecto.

Realice uno de los siguientes pasos:

  Haga clic en Aceptar para importar sólo los datos del levantamiento e ignorar la información de atributo del archivo .dc.

  Haga clic en Cancelar para configurar el proyecto con atributos en el Diálogo Propiedades proyecto / Ficha Características con la misma biblioteca referenciada por el archivo .dc, y a continuación vuelva a importar el archivo .dc.


No es posible importar el archivo

Durante la importación de un archivo, se produjo un error que impidió la importación del mismo. Aparecerá el siguiente mensaje:

¡El archivo <nombre de archivo> no se pudo importar!

Compruebe si el archivo está abierto en otra aplicación (por ejemplo, un archivo de Survey Controller (*.dc) abierto en la utilidad DC File Editor [Editor de archivos DC]). De lo contrario, es probable que el archivo esté corrupto.


Códigos de característica - Visión de conjunto
 Códigos de característica − Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Los códigos de característica constituyen una forma de registro de agrupación de puntos que necesitan reunirse para algún tipo de procesamiento. Por ejemplo, usted puede codificar todos los puntos capturados a lo largo de la línea de una valla con el nombre "VALLA" de forma, que al regresar a la oficina, todos los puntos con el código de característica VALLA puedan unirse por un estilo de línea concreto.

Para trabajar con códigos de característica, usted necesita:

  crear un archivo de biblioteca de características y atributos (*.fcl)

  transferir la biblioteca a Trimble Survey Controller

  transferir la biblioteca a TDS Survey Pro

  capturar datos utilizando códigos de característica de la biblioteca

  transferir un archivo de Survey Controller (*.dc) a Trimble Geomatics Office

  procesar códigos de característica

Un archivo de biblioteca de características y atributos consiste en un conjunto de instrucciones.

Para crear nuevas bibliotecas, use la utilidad Feature and Attribute Editor (Editor de características y atributos de Trimble). Puede crear tantas bibliotecas como necesite. Cuando se procesan los códigos de característica, las instrucciones de la biblioteca indican a Trimble Geomatics Office qué hacer con los datos de la selección. Cuando el valor de un campo de código de característica coincide con la condición especificada en la biblioteca de características y atributos, se ejecutan las acciones asociadas.

Para obtener más información sobre bibliotecas de características y atributos, véase la ayuda Feature and Attributes Editor.


Códigos de característica - Orden del procesamiento
 Códigos de característica − Orden del procesamiento

 Visión de conjunto y más información

Se procesan todos los códigos de característica de la selección actual, pero el método de selección utilizado dicta el orden del procesamiento.

Conjuntos de selección

Cuando se importa un archivo de Survey Controller (*.dc), se crea un conjunto de selección. Se denomina igual que el archivo .dc, y registra el orden en que los puntos se capturaron en el campo. Si utiliza este conjunto de selección, los códigos de característica se procesan en el orden en que se capturaron.

Otros métodos de selección

Asimismo puede efectuar uno de los siguientes pasos:

  Elegir un comando del menú Seleccionar.

  Hacer clic en un punto.

Con estos métodos, puede que el procesamiento no se produzca en el orden en que se capturaron los datos.


Códigos de característica - Errores comunes
 Códigos de característica – Errores comunes

 Visión de conjunto y más información

Cuando se utilizan códigos de característica pueden producirse los siguientes errores típicos:

Unión incorrecta debido al uso de un conjunto de selección equivocado

La unión incorrecta puede producirse al utilizar una selección gráfica (o el comando Seleccionar / Todos) al seleccionar puntos para la codificación de características en vez de utilizar el conjunto de selección creado por el sistema durante la importación de datos.

NOTA : Todas las entidades importadas del archivo se guardan en un conjunto de selección. En el caso de los archivos de Survey Controller (*.dc), el conjunto de selección se denomina en función del nombre interno del trabajo del archivo. Es decir, el conjunto de selección creado retiene el orden de los puntos importados. En el caso de los archivos .dc esto significa que el conjunto de selección retiene el orden en que se realizó el levantamiento. Esto es generalmente requerido en el procesamiento de códigos de característica.

Colocación de los puntos de control al lado de un código de punto equivocado

Por ejemplo: BORD1 INIC FAR

En este ejemplo el punto es la observación de una farola que está en la línea de un bordillo. Esta observación es el inicio de una línea de bordillo nueva. La farola es un punto a trazar con el símbolo apropiado. El comando INIC (Inicio) se aplica al código de punto que sigue (es decir, la farola). Esto significa que la línea a partir del último punto rotulado BORD1 se traza hacia el punto actual, lo cual no es la intención de la codificación.

La codificación debe ser: BORD1 INIC FAR o FAR BORD1 INIC

Error al utilizar el comando INIC (Inicio)

Esto hace que se tracen líneas continuas entre puntos con el mismo código en lugares donde no es correcto.


Códigos de campo - Visión de conjunto
Códigos de campo − Visión de conjunto

Más información

 Cómo ...

Visión de conjunto

Los códigos de campo son instrucciones especiales que indican a Trimble Geomatics Office que inserte información en los campos. Los códigos de campo también se utilizan para manejar la transferencia de datos de la base de datos en operaciones de importación/exportación con ASCII o en informes personalizados. Los códigos de campo se agrupan con varias cabeceras. Para obtener una lista de las cabeceras y los vínculos a la información de cada código, véase Detalles de códigos de campo.

Trimble Geomatics Office utiliza códigos de campo frecuentemente. Por ejemplo, los códigos de campo se utilizan en:

  el nombre y la fecha del proyecto en las cabeceras del proyecto cuando se cree un nuevo proyecto

  anotaciones

  etiquetas

  etiquetado personalizado de puntos

  importación/Exportación ASCII

  Definiciones de informe

Los códigos de campo siempre van entre pares de corchetes. Los caracteres que vayan entre '[]' se tratan como posibles expresiones de códigos de campo y, si es pertinente, se sustituyen por el valor del código de campo correspondiente.

Por ejemplo, se puede instruir a Trimble Geomatics Office para que etiquete de forma personalizada todos los puntos de la base de datos con su nombre utilizando el código de campo '[Name]' . Estas etiquetas pueden ampliarse para que incluyan la elevación al añadirse el código de campo '[Elevation]'.

Por ejemplo, con las configuraciones apropiadas [$Coordinate System Zone] puede visualizar "California Zona 3 0403" y [Feature Code] puede mostrar "ARBOL". Otra información tal como la fecha y hora del sistema actual de su computadora puede sacarse utilizando los códigos de campo [Date] y [Time].

Como ejemplo adicional, el código de campo Nombre=[Name] Elv=[Elevation]  puede generar el siguiente tipo de informe:

Nombre=3397 Elv=18.762

Nombre=3396 Elv=18.702

Nombre=3432 Elv=?

Nombre=3436 Elv=16.372

Para acceder a los códigos de campo, haga clic en el botón derecho del campo en el que quiere añadir dicho código. Si hay códigos de campo disponibles, la opción Campos aparece en el menú de acceso directo.

Sintaxis

El código de campo Sintaxis está formado por tres elementos:

[context.name:options]

Utilice el componente de contexto para eliminar cualquier ambigüedad que exista entre los nombres de códigos de campo. Por ejemplo, el código de campo [Name] siempre muestra el nombre del punto actual de la base de datos. Si quiere que el nombre del proyecto se muestre con un código de campo, éste debe incluir el contexto $Project (es decir, se requiere [$Project Name]). De lo contrario, se utilizará el nombre del punto actual.

El componente de contexto es opcional. Si se omite, Trimble Geomatics Office asume el contexto más lógico.

Las opciones que pueden incluirse con un código de campo generalmente son modificadores de dicho código. Este componente también es opcional.


Detalles sobre los códigos de campo

 Visión de conjunto y más información

Los códigos de campo se agrupan en varias cabeceras:


Códigos de campo de base de datos

 Visión de conjunto y más información

Los códigos de campo de base de datos proporcionan una salida directa de los valores calculados y los valores almacenados de la base de datos. Opcionalmente a un código de campo de base de datos se le puede poner un prefijo con el nombre de la tabla de la que proceden los datos.

Por ejemplo, [Point.easting] extrae el valor este de la tabla de puntos. Si sólo se especifica [Easting] también se extraerá el valor este de la tabla de puntos siempre que ésta sea la única tabla con un campo Este. Si existe alguna posibilidad de ambigüedad, debe especificarse el nombre de tabla.

Los códigos de campo disponibles son sensibles al contexto. Los nombres válidos dependen del contexto pero, en general, los códigos de campo asociados con las tablas de base de datos son:

Códigos de campo de base de datos

Un valor de campo de base de datos se saca directamente de la base de datos (por ejemplo, valor Este).

Códigos de campo calculados

$Center {<separador>} (alternativamente, $Centre {<separador>})

Para un arco, hay un código de campo $Centre especial que muestra el nombre de punto del centro (si se utilizó un punto de base de datos) o las coordenadas del punto central.

Se puede especificar un carácter separador entre valores de coordenadas para su presentación. Si el carácter separador se omite, se utiliza el carácter 'separador de listas' del Panel de control/Configuración regional de Microsoft Windows.

Primera ordenada

El valor de la primera ordenada (Este o Norte) dependiendo del orden de salida.

Segunda ordenada

El valor de la segunda ordenada (Norte o Este) dependiendo del orden de salida.

Nombre primera ordenada

El nombre de la primera ordenada (Este o Norte) dependiendo del orden de salida.

Nombre segunda ordenada

El nombre de la segunda ordenada (Norte o Este) dependiendo del orden de salida.


Códigos de campo de sistema

 Visión de conjunto y más información

Los códigos de campo de sistema proporcionan acceso a diversa información del sistema, y proporcionan varias funciones especiales. Utilice códigos de campo de sistema para añadir información adicional a informes.

NOTA: Todos estos códigos de campo de sistema pueden llevar un prefijo $System. Por ejemplo, [$System time] visualiza la hora actual de la computadora con la hora en que se utiliza el código de campo.

Aunque estos códigos de campo no necesitan llevar el prefijo $System, utilice este prefijo para evitar cualquier tipo de ambigüedad. Por ejemplo, [Time] visualiza el mismo valor que [$System Time].

Hora

Visualiza la hora actual de la computadora con la hora en que se utiliza el código de campo.

Fecha

Visualiza la fecha actual de la computadora con la fecha en que se utiliza el código de campo.

Resumen

Visualiza el resumen de la 'entidad actual'.

NOTA: El código de campo Resumen que se utiliza para un punto se define en el archivo OPTIONS.INI asociado con el proyecto. Generalmente, utiliza los códigos de campo de nombre y característica del tipo [Name]:[Feature Code]

Espacio:<cuenta>

Visualiza uno o más espacios.

Por ejemplo, el código de campo [$System.space:3] provee tres espacios.

Repetir<cadena>:<cuenta>

Visualiza un trozo de texto que se repite. El texto que quiere repetir debe ir entre comillas simples.

Por ejemplo, el código de campo [$System.Repeat<->:80] visualiza ochenta caracteres menos. Para obtener más información, véase Pantalla Introducción de parámetros.

Columna:<número>

Visualiza los espacios desde la posición actual de una línea hasta llegar a la columna especificada.

Por ejemplo, el código de campo [$System.Column:40] inserta espacios hasta que se alcance la columna 40 de la línea actual.

Reemplazar<buscar>:<reemplazar>

Sustituye todas las ocurrencias del texto especificado que se 'busca' con el texto de 'sustitución'. El código de campo Reemplazar<buscar>< reemplazar >debe ponerse después de los campos sobre los que se va a aplicar. Si el código de campo Reemplazar aparece antes que el campo que desea buscar y reemplazar, el campo no se cambiará.

Es opcional el hecho de especificar el texto de reemplazo. Si no se especifica, el texto a 'buscar' se quitará de la línea.

Por ejemplo, el código de campo [$System.Replace<°><degrees>] busca todas las ocurrencias de un símbolo de grado en la línea actual y lo sustituye con la palabra 'grados'.

Carácter:código

Inserta un carácter al especificar su código de carácter.

NOTA: La salida del carácter varía en función de la fuente que se utilice.

Por ejemplo, el código de campo [$System.Character:169] pone © en la mayoría de las fuentes.

Nombre del usuario

Visualiza el nombre de registro de red de los usuarios.

Nombre computadora

Visualiza la identificación de la red. Usted puede cambiar esta identificación en el sistema desde Panel de control / Red de Microsoft Windows.

Acerca de

Visualiza el nombre y número de versión del producto.

Por ejemplo, Trimble Geomatics Office, Versión 1.00

Nombre directorio

Hay varios códigos de campo diferentes que pueden utilizarse para proveer nombres de carpeta específicos relacionados con el sistema.

Los nombres de los directorios disponibles son:

ASCII para exportar

Dos códigos de campo que sólo son válidos para ASCII para exportar son:

Contador	Visualiza el número de códigos de campo utilizado. Puede emplearse para identificar individualmente cada uno de los valores exportados.
Línea	Visualiza el número de línea de un archivo para exportar. Se provee para aceptar definiciones ASCII que tengan una cuenta de líneas por cada línea del archivo.


Diálogo Introducción de parámetros

ADVERTENCIA: Trimble Navigation Limited soporta el uso o modificación de esta base de datos sólo si se utiliza el software Trimble Geomatics Office, de propiedad de Trimble. Trimble no soporta o autoriza el uso o modificación, ni garantiza el funcionamiento de esta base de datos si se emplean otras aplicaciones de software. Trimble puede modificar el formato de esta base de datos en cualquier momento haciéndolo incompatible con otras aplicaciones de software.

Este diálogo se muestra si necesita introducir un(os) valor(es) para completar una consulta de selección o un código de campo. Seleccione las consultas y códigos de campo que necesitan que los parámetros vayan seguidos de tres puntos. Este diálogo se muestra en diversos lugares de Trimble Geomatics Office.

Nombre

Muestra los parámetros a definir.

Valor

Introduzca el(os) valor(es) correspondiente(s).

El diálogo Introducción de parámetros aparece cuando se efectúa un informe de base de datos que se basa en los resultados de la consulta a la base de datos.


Códigos de campo de proyecto

 Visión de conjunto y más información

Los códigos de campo de proyecto proporcionan acceso a información de proyecto concreta. Utilice estos códigos de campo para añadir información adicional en los informes.

NOTA: Todos estos códigos de campo pueden ir precedidos por el prefijo $Project. Por ejemplo, [$Project.projection] visualiza el nombre del tipo de proyección de sistema de coordenadas utilizado por el proyecto.

Aunque estos códigos de campo no necesitan ir precedidos por $Project, utilice este prefijo para evitar cualquier tipo de ambigüedad. Por ejemplo, [Name] visualiza el mismo valor que [$Project.Name].

Nombre

Visualiza el nombre del proyecto que ha utilizado.

Camino

Visualiza el nombre de la carpeta en la que se almacenan los proyectos.

NOTA: Este código de campo provee la misma salida que el directorio $System.Projects.

Proyección

Visualiza el nombre del tipo de proyección de sistema de coordenadas utilizada para el proyecto. Por ejemplo, Mercator transversal.

Nombre auto

Visualiza el nombre del nombre de punto auto actual.

Por ejemplo, se pone AUTO 0009 si el nombre del punto auto anteriormente asignado era AUTO 0008.

Capa CAD

Visualiza el nombre de capa CAD actual.

Unidades:tipo

Visualiza el nombre de la unidad apropiada. Siempre debe proveerse un tipo.

NOTA: Distancia, elevación, coordenada y ángulo están disponibles.

Por ejemplo, el código de campo [$Project.Units:Distance] visualiza la unidad de distancia configurada para el sistema. Usted puede incluir el nombre 'verboso' para obtener un valor de código de campo completo. Por ejemplo, para obtener 'Metros' en vez de 'm' utilice [$Project.Units:Distance:verbose].

Tipo:distancia

Visualiza el tipo de presentación para la distancia. Usted puede configurarlo en Archivo / Propiedades proyecto / Unidades y formato.

Tipo:LLA

Visualiza el tipo de presentación para la latitud, longitud, y altura (local o WGS-84).

Tipo:acimut

Este código de campo muestra el tipo de presentación de los acimutes. Puede configurarlo para que visualice acimut de cuadrícula o acimut geodésico. Configúrelo desde Archivo / Propiedades proyecto / Unidades y formato.


Códigos de campo de cabeceras

 Visión de conjunto y más información

Los códigos de campo de cabeceras proveen acceso a los datos registrados en los campos de cabeceras del proyecto de la ficha Detalles proyecto del diálogo Propiedades proyecto.

NOTA: Todos estos códigos de campo pueden ir precedidos por $Headings. Por ejemplo, [$Headings.Title] visualiza el título del proyecto actual.

Si se cambia cualquiera de las cabeceras, las cabeceras de los códigos de campo disponibles cambian según corresponda.

Aunque estos códigos de campo no necesitan ir precedidos por $Headings, utilice este prefijo para evitar cualquier tipo de ambigüedad.

Los códigos de campo de cabecera estándar son:

Título

Visualiza el título del proyecto actual.

Descripción

Visualiza una descripción del proyecto.

Referencia

Visualiza un número de referencia del proyecto de forma que usted pueda vincular el proyecto al proceso de fijación de costes de oficina.

Topógrafo

La salida de este código de campo puede resultar útil para referencia posterior.

Operador computadora

La salida de este código de campo puede resultar útil para referencia posterior.

Fecha

Visualiza la fecha de creación del proyecto. Esta se realiza automáticamente utilizando el código de campo de fecha del proyecto de la plantilla.

Datum vertical

Muestra el datum vertical del proyecto.

Equipo

Visualiza el(os) número(s) de serie del equipo.


Códigos de campo de sistema de coordenadas

 Visión de conjunto y más información

Los códigos de campo del sistema de coordenadas proporcionan acceso a información concreta sobre el sistema de coordenadas del proyecto. Utilice estos códigos de campo para añadir información adicional en los informes.

NOTA: Todos estos códigos de campo de sistema de coordenadas pueden ir precedidos por $Coordinate System. Por ejemplo, [$Coordinate system.System] visualiza el nombre del sistema de coordenadas utilizado por el proyecto.

Aunque estos códigos de campo no necesitan ir precedidos por $Coordinate System, utilice este prefijo para evitar cualquier tipo de ambigüedad.

NOTA: Los códigos de campo $Coordinate System ponen 'No seleccionado' cuando no hay ninguna configuración disponible.

Sistema

Visualiza el nombre del sistema de coordenadas utilizado por el proyecto (por ejemplo, Plano de estado de Estados Unidos - 1983).

Zona

Visualiza el nombre del sistema de coordenadas utilizado por el proyecto.

Datum

Visualiza el nombre del datum en que se basa la proyección de sistemas de coordenadas (por ejemplo, Norteamericano de 1983 (Conus)).

Geoide

Visualiza el nombre del modelo geoidal utilizado por el proyecto (por ejemplo, GEOID96 (US Continental)).

Ajuste local

Visualiza el nombre de todas las definiciones de ajuste local del proyecto.


Códigos de campo de proyección

 Visión de conjunto y más información

Los códigos de campo de proyección proveen acceso a información de proyección concreta utilizada en el sistema de coordenadas del proyecto. Utilice estos códigos de campo para añadir información adicional en los informes.

NOTA: Todos estos códigos de campo de proyección pueden ir precedidos por $Projection. Por ejemplo, [$Projection.Name] visualiza el nombre de la proyección del sistema de coordenadas utilizada por el proyecto.

Aunque estos códigos de campo no necesitan ir precedidos por $Projection, utilice este prefijo para evitar cualquier tipo de ambigüedad.

Nombre

Visualiza el nombre del tipo de proyección (por ejemplo, Mercator transversal).

Los códigos de campo de proyección que quedan restauran los valores actuales de los parámetros de proyección utilizados por el proyecto.

NOTA: No todos los códigos de campo son válidos para todos los tipos de proyección. Es decir, no todos los códigos de campo son válidos en todos los casos. A continuación se muestra una lista de códigos de campo con todos los parámetros de proyección que pueden restaurarse. Dependiendo de la proyección utilizada por el proyecto, sólo los códigos de campo adecuados restaurarán valores. Todos los códigos de campo que no son válidos para la proyección ponen 'N/A' (que significa No pertinente).

Todos los códigos de campo siguientes visualizan el valor detallado:

Falso norte

El valor del falso norte para la proyección.

Falso este

El valor del falso este para la proyección.

Falsa elevación

El valor de la altura elipsoidal en el origen de una proyección plana.

Altura origen

El valor de elevación en el origen de una proyección plana.

Latitud origen

La latitud origen para la proyección.

Longitud origen

La longitud origen para la proyección.

Factor de escala

El factor de escala central para la proyección (basado en la unidad).

Acimut

El valor del acimut de desviación para las proyecciones Mercator oblícua y R.S.O. con una definición de acimut de desviación.

Convergencia

El valor del ángulo de desviación para la proyección Mercator oblícua y R.S.O. con una definición de desviación por convergencia origen.

Paralelo 1

El paralelo norte que se utiliza en la definición de las proyecciones Lambert de 2 paralelos y Cónica equiareal de Albers.

Paralelo 2

El paralelo sur que se utiliza en la definición de las proyecciones Lambert de 2 paralelos y Cónica equiareal de Albers.

Latitud Punto 1, Longitud Punto 1, Latitud Punto 2, Longitud Punto 2

Estos cuatro códigos de campo se utilizan en las proyecciones Mercator oblícua y R.S.O. definidas por dos puntos. Estos campos son las posiciones del punto de definición.


Códigos de campo de datum

 Visión de conjunto y más información

Los códigos de campo de datum proveen acceso a detalles de datum específicos utilizados en el sistema de coordenadas del proyecto. Utilice estos códigos de campo para añadir información adicional en los informes.

NOTA: Todos estos códigos de campo de datum pueden ir precedidos por $Datum. Por ejemplo, [$Datum.Method] visualiza el nombre del datum utilizado por el proyecto.

Aunque estos códigos de campo no necesitan ir precedidos por $Datum, utilice este prefijo para evitar cualquier tipo de ambigüedad.

NOTA: No todos los códigos de campo son válidos para todos los tipos de datum. Es decir, no todos los códigos de campo son válidos en todos los casos. A continuación se da una lista de códigos de campo con todos los parámetros de datum que pueden restaurarse. Dependiendo del datum utilizado por el proyecto, sólo los códigos de campo adecuados restaurarán valores. Todos los códigos de campo que no sean válidos para el datum ponen 'N/A' (que significa No disponible).

Todos los códigos de campo siguientes visualizan el valor detallado:

Método

El nombre del método de transformación de datum utilizado (por ejemplo, tres parámetros).

Traslación X

El valor de la traslación X (disponible para las transformaciones de datum de tres y siete parámetros).

Traslación Y

El valor de la traslación Y (disponible para las transformaciones de datum de tres y siete parámetros).

Traslación Z

El valor de la traslación Z (disponible para las transformaciones de datum de tres y siete parámetros).

Rotación X

El valor de la rotación X (sólo disponible para las transformaciones de datum de siete parámetros).

Rotación Y

El valor de la rotación Y (sólo disponible para las transformaciones de datum de siete parámetros).

Rotación Z

El valor de la rotación Z (sólo disponible para las transformaciones de datum de siete parámetros).

Factor de escala

El valor del factor de escala de la transformación de datum de siete parámetros expresado en partes por millón (ppm).

Nombre de elipsoide

El nombre del elipsoide utilizado en el proyecto.

Achatamiento del elipsoide

El achatamiento del elipsoide.

Semieje mayor

El semieje mayor del elipsoide.


Códigos de campo de calibración

 Visión de conjunto y más información

Los códigos de campo de calibración proveen acceso a información de calibración concreta utilizada en el sistema de coordenadas del proyecto. Utilice estos códigos de campo para añadir información adicional en los informes.

NOTA: Todos estos códigos de campo de calibración pueden ir precedidos por $Calibration. Por ejemplo, [$ Calibration.Rotation] visualiza el valor de rotación de la transformación plana de la calibración local GPS.

Aunque estos códigos de campo no necesitan ir precedidos por $Calibration, utilice este prefijo para evitar cualquier tipo de ambigüedad.

NOTA: Los códigos de campo de calibración están separados en dos grupos respecto a los componentes vertical y horizontal de una calibración de ajuste GPS. Todos los códigos de campo de cada grupo son válidos siempre que se haya calculado el componente. Es decir, todos los componentes de la calibración vertical son válidos si dicha calibración está disponible en el sistema de coordenadas. La siguiente lista de códigos de campo incluye todos los parámetros de calibración que pueden ponerse. Todos los códigos de campo que no sean válidos para la calibración ponen 'N/A' (que significa No disponible).

Todos los códigos de campo siguientes visualizan el valor detallado:

Norte origen vert

El valor norte del punto origen de la transformación vertical.

Este origen vert

El valor este del punto origen de la transformación vertical.

Corrección const vert

El desplazamiento vertical que se aplica en el punto de origen de la transformación.

Corrección vert norte

La corrección vertical por norte unidad que se aplica a la transformación.

Corrección vert este

La corrección vertical por este unidad que se aplica a la transformación.

Norte origen horz

El valor norte del punto origen de la transformación horizontal.

Este origen horz

El valor este del punto origen de la transformación horizontal.

Traslación horz norte

El valor de la traslación horizontal aplicado en la dirección norte.

Traslación horz este

El valor de la traslación horizontal aplicado en la dirección este.

Factor de escala

El factor de escala (basado en la unidad) aplicado en la transformación horizontal.

Rotación

La rotación aplicada en la transformación horizontal.


Códigos de campo especiales

 Visión de conjunto y más información

Estos códigos de campo especiales facilitan el acceso a la diversa información de la computadora, y proporcionan varias funciones especiales. Utilice estos códigos de campo para añadir información adicional en los informes.

$File.filename

Este código de campo visualiza el contenido del archivo especificado.

NOTA: El uso del carácter de dos puntos (:) en algunas de las definiciones de los códigos de campo no permite que este carácter se utilice para definir la letra de la unidad de computadora (son conflictivos). Si se necesita especificar una unidad, utilice <unidad> en lugar de 'unidad:'. Por ejemplo, <C> especifica la unidad C:

Trimble Geomatics Office utiliza algunos códigos de campo especiales para poner los directorios estándar.

$Home (donde se ubica TGOffice.exe)

$System (el subdirectorio del sistema por debajo de $Home donde se ubica TGOffice.exe)

$Project (el directorio del proyecto actual)

Por ejemplo [$FILE.<c>\temp\data.txt] o [$file.$system\myfile.txt]

NOTA: Aquí también puede utilizar 'expandir'.

$Env.variable

Visualiza la variable denominada del entorno.

$Key.key

Visualiza la cadena con la tecla dada tomada del archivo .ini (o del Registro).

El formato del código de campo 'nombre' es tecla {,sección}{;ruta}

Si se omite la Sección, se utiliza el 'Código de campo', y si se omite la ruta, se asume $System.

Al igual que con $File, la ruta de acceso puede iniciarse con cualquiera de los siguientes:

  $Home

  $System

  $Project

NOTA: Si la ruta de acceso sólo es $Project entonces se utiliza el archivo *.ini del proyecto. (Primero se examina Options.ini, después tgo_v100.ini - estos son archivos INI asociados con todos los proyectos.) Si la ruta de acceso sólo es $System entonces se utiliza la zona del registro de Trimble Geomatics Office.

$Text.text

Visualiza el texto que ha introducido. Esto resulta útil en informes.

Por ejemplo [$Text.Feature code:20] visualiza la etiqueta 'Código de característica' ubicada a 20 espacios del punto.

$Annotation

Durante la edición de plantillas de anotación, están disponibles dos códigos de campo adicionales. Estos son:[$Annotation.Style:=nombre del estilo] y [$Annotation.Layer:=nombre de la capa].

Estos códigos de campo permiten especificar el estilo de texto, capa, o ambos de una anotación directamente al lado de dicha anotación.

Por ejemplo, se podría especificar una anotación de nombre de punto de la siguiente manera: [Name][$Annotation.style:=Annot style].

Anota un punto con su nombre utilizando un estilo de texto denominado 'Estilo anot' para la anotación de texto.

SUGERENCIA: Estos códigos de campo le permiten asignar estilos de texto y capa individuales a diferentes anotaciones de una plantilla.

Si el estilo o capa no existe, éste/a se creará.

Asimismo, cuando se definan estilos de anotación hay disponibles dos caracteres de código de campo adicionales. Para seleccionarlos, haga clic en el botón derecho del ratón y seleccione Campos / Avanzado / Más / Caracteres.

Nueva línea

Crea una nueva línea pero mantiene todas las anotaciones como una entidad para selección o edición. Por ejemplo [Name]|[Northing]|[Easting].

Salto de entidad

Crea una nueva línea e inicia una nueva entidad. Este carácter puede utilizarse para crear múltiples anotaciones separadas en una única definición. Por ejemplo, se podría definir: [Name]\f[Northing]\f[Easting] para una anotación de punto con lo que se crean tres anotaciones separadas que se amontonan verticalmente y se asocian al punto.

$Report

Cuando defina informes de base de datos, se proveen tres tipos de códigos de campo especiales.Estos son:

Nombre

Visualiza el nombre de la definición del informe.

Cabecera

Visualiza la cabecera predefinida del informe que se almacena en el archivo Options.ini del proyecto.

<Parámetro>

Visualiza los valores especificados de los parámetros que se han introducido para una consulta utilizada como origen de un informe.

$Export

Cuando trabaje con definiciones de exportación de archivos, hay dos códigos de campo especiales. Estos son:

Nombre de archivo

Visualiza el nombre de la definición del informe.

<Parámetro>

Visualiza los valores especificados de parámetros introducidos para una consulta usada como el origen de los datos de exportación de archivos.


Códigos de campo de formato de hoja

 Visión de conjunto y más información

En la definición de plantillas se proveen varios códigos de campo especiales. Úselos en la definición de plantilla para poder mostrar detalles específicos del dibujo.

NOTA: Todos estos códigos de campo de formato de hoja pueden ir precedidos por $Plot. Por ejemplo, [$Plot.Scale] visualiza la escala del dibujo.

Aunque estos códigos de campo no necesitan ir precedidos por $Plot, utilice este prefijo para evitar cualquier tipo de ambigüedad.

Escala

Visualiza la escala del dibujo.

Nombre primera ordenada de origen

Muestra el nombre de la primera ordenada de origen. Por ejemplo, con la opción Archivo / Propiedades proyecto / Unidades y formato / Orden de coordenadas especificada en Norte primero, [$Plot.First Origin Ordinate Name] se visualiza 'Norte'.

Nombre segunda ordenada de origen

Muestra el nombre de la segunda ordenada de origen. Por ejemplo, con la opción Archivo / Propiedades proyecto / Unidades y formato / Orden de coordenadas especificada en Norte primero, [$Plot.Second Origin Ordinate Name] se visualiza 'Este'.

Primera ordenada de origen

Muestra el valor de la primera ordenada de origen. Por ejemplo, con la opción Archivo / Propiedades proyecto / Unidades y formato / Orden de coordenadas especificada en Norte primero, [$Plot.First Origin Ordinate Name] se visualiza el valor Norte del origen del dibujo.

Segunda ordenada de origen

Muestra el valor de la segunda ordenada de origen. Por ejemplo, con la opción Archivo / Propiedades proyecto / Unidades y formato / Orden de coordenadas especificada en Norte primero, [$Plot.Second Origin Ordinate Name] se visualiza el valor Este del origen del dibujo.

N origen

Visualiza el valor Norte del origen del dibujo.

E origen

Visualiza el valor Este del origen del dibujo

Rotación

Visualiza los valores de rotación especificados para el dibujo.

Formato hoja

Visualiza el nombre del formato de hoja utilizado por el proyecto.


Modificadores

 Visión de conjunto y más información

Los modificadores de códigos de campo son comandos especiales que se utilizan para modificar la salida de un código de campo.

Utilícelos para:

  obtener la salida específica que requiere del código de campo.

  proporcionar información de formato complementaria o parámetros adicionales cuando se saquen datos

Pueden utilizarse varios modificadores para modificar un único código de campo. En dicho caso, generalmente se especifican como sigue:

	[Código de campo{:FormatElem}{:FormatElem} {:FormatElem}{:FormatElem}]
donde FormatItem es un nombre de modificador o un diseño de formato. Los paréntesis indican que son elementos opcionales.

Cuando se especifique un modificador, el sistema acepta tanto mayúsculas como minúsculas o una mezcla de ambas.

A continuación se indican los modificadores posibles:

Valor de anchura (numérico)

Especifica la anchura de la salida de un código de campo. Si el valor de anchura es negativo, la salida se justifica a la izquierda, de lo contrario se justifica a la derecha.

Por ejemplo, si el código de campo = "código muestra", entonces [Feature code:15] muestra

" código muestra" (con 15 caracteres de ancho al añadir cuatro espacios a la izquierda).

Valores de anchura y cifras decimales (numérico)

Especifica la anchura y el número de cifras decimales para la salida de un código de campo. El modificador tiene la forma A.D donde A es la anchura y D es el número de cifras decimales.

Si el valor de la anchura es negativo, el campo se justifica a la izquierda, en caso contrario se justifica a la derecha.

Si el valor de anchura empieza por cero, pero no sólo es cero (por ejemplo, 08.3), entonces el relleno se hace con ceros en vez de con espacios.

Por ejemplo,	si Elevación = 10.3258

Entonces	[Elevation:0.3] visualiza 10.326

Y	[Elevation:07.2] visualiza 0010.33

Unidades

Pone las unidades de los valores. Por ejemplo, m  para metros, ps  para pies internacionales, y ps USA para pies topográficos estadounidenses. Puede utilizar este modificador para garantizar que se muestren las unidades incluso cuando la opción de presentación de unidades de la ficha Archivo / Propiedades proyecto / Unidades y formato se ha configurado en No.

Sin unidades

Garantiza que no se muestren unidades con los valores. Puede utilizar este modificador para garantizar que no se muestren unidades incluso cuando la opción de presentación de unidades de la ficha Archivo / Propiedades proyecto / Unidades y formato se ha configurado en Sí.

Mayúscula

Pone todos los caracteres alfa sacados por un código de campo con letras mayúsculas

Minúscula

Pone todos los caracteres alfa sacados por un código de campo con letras minúsculas

Derecha

Justifica la salida de un código de campo a la derecha con el ancho de columna especificado. Si ésta no se ha especificado, no se realizará ninguna justificación.

Izquierda

Justifica la salida de un código de campo a la izquierda con el ancho de columna especificado. Si ésta no se ha especificado, no se realizará ninguna justificación.

Centro

Justifica la salida de un código de campo con el ancho de columna especificado. Si ésta no se ha especificado, no se realizará ninguna justificación.

Por ejemplo, si Código característica = "ejemplo"

Entonces [Feature code:11:Center] visualiza "  ejemplo  ".

Es decir, en este caso se restaura con dos espacios a la izquierda y dos espacios a la derecha.

Cortar

Recorta la salida con el fin de mostrar el ancho dado (delante/detrás) si la anchura es positiva o negativa.

Por ejemplo, si Código característica = Ejemplo

Entonces [Featurecode:4:Trim] muestra 'Exam'

Y [Featurecode: -4:Trim] visualiza 'mple'

Expandir

Expande todos los códigos de campo encontrados en el texto sacados por el código de campo al que se aplique 'expandir'.

Por ejemplo, el código de campo [$File.$System\text.txt:expand], cuando se utiliza al importar un archivo, expande todos los códigos de campo encontrados en el archivo Texto.txt antes de visualizarlo.

Estándar

Convierte la salida en puntuación numérica estándar (punto para el símbolo decimal y sin símbolo de agrupación de dígitos; es decir, sin separador de miles).

NOTA: Este modificador sólo se aplica a las definiciones de informe. Las rutinas de importación pueden recibir datos numéricos de la forma estándar (con símbolo de agrupación de dígitos y punto para el punto decimal) o valores que utilicen el símbolo de agrupación de dígitos y el símbolo para los decimales configurado en el sistema de Microsoft Windows (en español el punto y la coma respectivamente). Las rutinas de exportación convierten la salida numérica a la forma estándar.

Invertido

Revierte el sentido de los códigos de campo pertinentes. Por ejemplo, [Azimuth:Reverse] invierte el acimut que normalmente se daría para una línea determinada.

Cuadrante

Muestra el acimut como un rumbo del cuadrante. Por ejemplo, un acimut de 228°37'25" se muestra como N81°22'35"O.

Todo el círculo

Muestra el acimut como un rumbo circular completo. Por ejemplo, si el formato de acimut se ha configurado en norte rumbo cuadrante 81 grados 22 minutos y 35 segundos oeste, se muestra como 228°37'25".

Verboso

Utiliza la expresión de texto completa siempre que sea pertinente. Por ejemplo, si las unidades se han abreviado a 'm', utilice el modificador verboso para visualizar la palabra 'metros'.

Dividir

Divide la cadena en el punto decimal.

Por ejemplo, el modificador [Elevation:split] da la elevación sin la separación de decimales.

NOTA: Cuando se diseñen plantillas de anotación, este modificador resulta útil para la posición de anotación de punto Habilitado

Este modificador reemplaza '.' con un único espacio, pero usted puede aumentarlo utilizando :split<3>, por ejemplo:

PartInt (Parte integral)

Quita la parte fraccionaria del valor (hasta ' ')

PartFrac (Parte fraccionaria)

Quita la parte integral del valor (desde ' ')

Implicado

Maneja la importación y exportación de archivos ASCII donde el punto decimal no está presente en valores numéricos, pero se implica su posición. El modificador se usa en conjunción con los modificadores decimales y de anchura estándar.

Por ejemplo, [North:10.3:Implied] sacará el valor norte 4853297.692 como 4853297692. La misma definición de código permite la interpretación correcta de valores con puntos decimales (comas) implicados en la importación.


Diseños del formato

 Visión de conjunto y más información

Esto le permite construir códigos de campo.

Por ejemplo, se puede crear un código de campo para una fecha utilizando componentes de diseño de formato:

[Fecha:<{DDDD}, {MMM} {D}-{AAAA}!>]

Esto genera Domingo, Oct 17 1999!

NOTA: Usted puede incluir cualquier texto en el código de campo. En el ejemplo anterior, se ha incluido un signo de exclamación.

Los diseños de formato siempre van entre comillas simples (< >) (en el caso de diseños de formato completos) o entre llaves ({ }) (para los componentes de un diseño de formato).

Este tipo de diseños sólo se aplica a ciertos tipos de datos. Estos son:

 Diseños del formato de fecha

 Diseños del formato de hora

 Diseños del formato de ángulos/rumbos

Las fechas y las horas proveen componentes de un diseño de formato mientras que los ángulos/rumbos proveen los diseños de formato completos.


Diseños de formato de fecha

 Visión de conjunto y más información

Los diseños de formato de fecha proveen control para la presentación del componente fecha de un código de campo. Por ejemplo, el código de campo fecha que incluye el componente dd visualiza la fecha con un cero a la izquierda.

NOTA: Las muestras de diseños de formato de fecha que utilizan valores representativos están disponibles en la opción de acceso directo Campos / Avanzado / Más / Diseños de formato. Estos diseños se convierten automáticamente a los códigos de campo detallados listados.

A continuación se muestra la lista completa de los tipos de diseño de formato de fecha disponibles:


Diseños de formato de hora

 Visión de conjunto y más información

Los diseños de formato de hora proveen control para la presentación del componente hora de un código de campo. Por ejemplo, el código de campo hora puede incluir el componente hh para visualizar la hora con un cero a la izquierda (reloj de 12 horas).

NOTA: Las muestras de diseños de formato de hora que utilizan valores representativos están disponibles en la opción de acceso directo Campos / Avanzado / Más / Diseños de formato. Estos diseños se convierten automáticamente a los códigos de campo detallados listados.

La lista completa de los tipos de diseño de formato de hora disponibles es:

NOTA: Los componentes del diseño del formato de la hora del día deben estar ordenados, con las horas antes que los minutos y éstos antes que los segundos seguidos de los milisegundos y por último t o tt. Usted puede omitir cualquiera de estos elementos de formato.

Los componentes de la fecha y la hora pueden utilizarse para los códigos de campo de fecha y hora; los datos dados llevan toda la información. La caja de los componentes es importante para poder distinguir entre minutos (m) y meses (M).

Ejemplos:

<DDDD, MMM D, AAAA!> genera 'Jueves, Oct 14 1999!'  que es la fecha actual.

<hh mm sstt!> genera'01 02 07pm!'  que es la hora actual.


Diseños de formato de ángulos y rumbos

 Visión de conjunto y más información

Estos diseños proveen control sobre la presentación del componente ángulo/rumbo de un código de campo. Por ejemplo, el código de campo Acimut puede incluir el componente <dm.mm> para mostrar el acimut en grados y minutos decimales.

NOTA: Estos diseños de ángulos/rumbos están disponibles desde la opción del menú de acceso directo de Campos / Avanzado / Más / Diseños de formato.

Los tipos de diseños de formato de ángulos/rumbos disponibles son:

Segundos decimales

Muestra ángulos/rumbos utilizando grados, minutos, y segundos decimales (cuando las unidades angulares se han configurado en grados). Este diseño de formato inserta los caracteres del diseño <dms.ss>. Por ejemplo, [Azimuth:0.3:<dms.ss>] muestra un valor de acimut con tres cifras decimales de segundo.

Minutos decimales

Muestra ángulos/rumbos utilizando grados y minutos decimales (cuando las unidades angulares se han configurado en grados).Este diseño de formato inserta los caracteres del diseño <dm.mm>. Por ejemplo, [Azimuth:0.4:<dm.mm>] muestra un valor de acimut con cuatro cifras decimales de minuto.

Grados decimales

Muestra ángulos/rumbos utilizando grados decimales (cuando las unidades angulares se han configurado en grados). Este diseño de formato inserta los caracteres del diseño <d.dd>. Por ejemplo, [Azimuth:0.6:<d.dd>] muestra un valor de acimut con seis cifras decimales de grado.

Grados decimales señalados

Muestra ángulos/rumbos utilizando grados decimales (cuando las unidades angulares se han configurado en grados) y va precedido por un signo. Este diseño de formato inserta los caracteres del diseño <+d.dd>. Por ejemplo, [Latitude<+d.dd>:0.8] muestra un valor de latitud que puede tener hasta ocho cifras decimales de grado y cuyo valor va precedido por un signo (+ o -).


Sustitución de códigos de campo

 Visión de conjunto y más información

La sustitución de códigos de campo reconoce algunas secuencias de caracteres especiales que no forman parte de los códigos de campo. Estas son:

Ejemplos:

Para crear un formato de salida ASCII delimitado con tabulación, use los siguientes códigos de campo:

[Name]\t[Easting]\t[Northing]\t[Elevation]\t[Feature Code]

Para anotar una línea con el acimut y la distancia en dos líneas, utilice los siguientes códigos de campo:

[Azimuth]|[Distance]


Códigos de campo e importación ASCII

 Visión de conjunto y más información

Los códigos de campo permitidos en un formato para importar son:

  Sólo los campos de la tabla de puntos.

  Sin registros secundarios ni códigos de campo de sistema.

(Una excepción que sí se permite es [$System.Repeat<search><replace>)

Se permiten algunos campos calculados (por ejemplo, Latitud/Longitud).

$Skip

Hay un campo especial ($Skip) que ayuda a interpretar una entrada ASCII.

Espacio

Este código de campo salta varios espacios según el ancho y, si no se provee ninguna anchura, salta a un espacio en blanco. Necesita asegurarse de que pone un espacio antes de Saltar, de forma que Trimble Geomatics Office lo sepa. Por ejemplo:

[Name] [$Skip.Space][Northing] [$Skip.Space][Easting] [$Skip.Space]

Número

Este código de campo salta un número dado (caracteres '+', ‘-', '.'  & '0'...'9'). Si hay ancho, salta el número de caracteres correspondiente, de lo contrario, salta al primer carácter no numérico.

NOTA: Esto no funciona con valores nulos o exponenciales.

Línea

Este código de campo salta el número de líneas dado en la anchura, o una línea.

Texto

Este código de campo salta el número de caracteres dado o hasta un carácter no impreso (por ejemplo, '\n').

Columna

Este código de campo salta al número de la columna dada.

A:cadena

Este código de campo salta al primer carácter que sigue a la cadena dada (Por ejemplo, [$Skip.A:ENTITIES]).

NOTA: La cadena no puede incluir nuevas líneas.

Hay algunas 'funciones especiales de formato'.

Estándar

Esta función de formato convierte la entrada de la puntuación estándar: '.' cambiará al carácter decimal utilizado (ej, una coma).

Saltar

Esta función de formato lee el campo normalmente pero no lo almacena (por ejemplo [Point.Horz Prec:10.3:skip]).

= (signo de igualdad)

Esta función de formato asigna el valor del campo utilizando el resto de la cadena del formato. No mira el archivo (por ejemplo, [Feature Code:=imported]). Estos campos deben ir primero en la cadena de definición del código de campo (de lo contrario puede crearse confusión en el proceso de análisis). Por ejemplo '[Elevation:=0.0][Name],[Northing],[Easting]'

NOTA: Cuando se defina un formato ASCII para importar es importante que se especifique bien el ancho del código de campo (por ejemplo, [WGS Latitude:11]) o que se especifique el carácter separador entre códigos de campo (por ejemplo, [WGS Latitude],[ WGS Longitude],[WGS Height] donde las comas indican el final de los 'campos 'Campos').  Esto es importante porque cuando las rutinas de importación intentan interpretar los valores de un archivo ASCII utilizan la definición de formato para poder deducir la parte de cada línea del archivo que debe leerse a un campo de base de datos dado. El ancho o caracteres de separación permite localizar las partes correspondientes de las líneas de archivo.

NOTA: Para mostrar las horas de evento al milisegundos más cercano, añada el siguiente formato de hora al código de campo, <H:mm:ss.nnn>, donde nnn es el número de segundos decimales. Por ejemplo, [Hora obs punto:<H:mm:ss.nnn>]. Para incrementar la precisión horaria, aumente el número de segundos decimales. Por ejemplo, nnnn saca los primeros 4 segundos decimales.


Diálogo Parámetros de códigos de campo

Utilice este diálogo para completar el código de campo. El título del diálogo indica el contexto.

Nombre

Esta columna muestra el(os) parámetros a definir.

Valor

Introduzca el(os) valor(es) pertinentes.


Transferencia de archivos a Trimble Survey Controller - Visión de conjunto

Más información

Cómo ...	Diálogo
Visión de conjunto

Podrá transferir archivos que necesite en el campo a Trimble Survey Controller. Para ello necesita un dispositivo Survey Controller configurado para la utilidad Data Transfer (Transferencia de datos).

Se pueden transferir los siguientes tipos de archivos:

  Archivos de antena

  Arch. de la cuadrícula del datum (*.cdg)

  Archivos colector de datos (*.dc)

  Archivos diccionario de datos (*.ddf)

  Puntos MDT

  Bibliotecas de caract. y atributos (*.fcl)

  Archivos de cuadrícula de geoide (*.ggf)

  Archivos de la cuadrícula nacional del Reino Unido (*.pgf)


Opción Detalles antena al Survey Controller

Si ha editado información de antena en un archivo de antena, use esta opción para transferir esta información al software Trimble Survey Controller.

  Para el software Trimble Survey Controller versión 6.00 ó posterior, los detalles de antena se almacenan en el archivo Antenna.ini.

  Para el software Trimble Survey Controller versión 5.03 ó anteriores, los detalles de antena se almacenan en el archivo Antenna.dat.

NOTA: Para exportar detalles de antena, el archivo de antena pertinente debe estar ubicado en la carpeta Archivos del programa \ Archivos comunes \ Trimble \ Config.


Opción Archivos Survey Controller (*.dc)

Los archivos Survey Controller (*.dc) proporcionan el enlace entre Trimble Geomatics Office y el software Trimble Survey Controller. Estos archivos se crean cuando se importa un trabajo desde el trabajo del software Trimble Survey Controller o cuando se exporta un proyecto de Trimble Geomatics Office a este formato de archivo.

Mediante el software Trimble Geomatics Office es posible:

  Importar un archivo Survey Controller (*.dc)

  Exportar un proyecto de Trimble Geomatics Office a un archivo Survey Controller (*.dc) para ser posteriormente transferido al software Survey Controller

Para importar un archivo Survey Controller (*.dc):

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos Survey Controller (*.dc). Aparecerá el diálogo Abrir.

4.	Seleccione en una carpeta el archivo que desee importar y haga clic en Abrir.

Para exportar el proyecto de Trimble Geomatics Office actual a un archivo Survey Controller (*.dc):

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo Survey Controller (*.dc).

4.	Haga clic en Opciones para abrir el diálogo Opciones colector de datos y especifique el nombre interno del archivo y la versión del archivo Survey Controller.

5.	Haga clic en Aceptar para aceptar las configuraciones y volver al diálogo Exportar.

6.	Haga clic en Aceptar. Aparecerá el diálogo Guardar como.

7.	Seleccione la carpeta en la que quiere guardar el archivo.

8.	Por defecto se utiliza el nombre del proyecto como el nombre de archivo. Para cambiarlo, introduzca un nombre en el campo Nombre de archivo y haga clic en Guardar.


Opción Survey Controller

Mediante el software Trimble Geomatics Office se pueden transferir datos directamente entre un proyecto de Trimble Geomatics Office y el software Trimble Survey Controller. Cuando se importa un trabajo del software Trimble Survey Controller se lo convierte al formato de Archivo Survey Controller (*.dc) que es el utilizado por el software Trimble Geomatics Office.

Utilice el software Trimble Geomatics Office para:

  importar un trabajo del software Trimble Survey Controller

  exportar un proyecto de Trimble Geomatics Office al software Trimble Survey Controller

Para acceder a la opción use una de las siguientes alternativas:

  Para importar un trabajo de Survey Controller a un proyecto de Trimble Geomatics Office:

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Dispositivo topográfico y haga clic en Aceptar. Aparecerá el diálogo Transferencia de datos / Abrir.

  Para exportar un proyecto de Trimble Geomatics Office al Survey Controller.

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento..

3.	Seleccione la opción Dispositivo topográfico.

4.	Haga clic en Opciones para abrir el diálogo Opciones colector de datos a fin de especificar el nombre interno del archivo y la versión del archivo Survey Controller.

5.	5.	Haga clic en Aceptar para aceptar las configuraciones y volver al diálogo Exportar.

6.	6.	Haga clic en Aceptar. Aparecerá el diálogo Guardar como.

7.	7.	Seleccione un dispositivo controlador topográfico.

8.	8.	Haga clic en Abrir. La computadora se conectará al software Trimble Survey Controller.

9.	9.	Seleccione la opción Memoria principal o Tarjeta datos topográficos (si está disponible).

10.	10.	Haga clic en Abrir. El software leerá la carpeta que ha seleccionado y mostrará todos los trabajos de Trimble Survey Controller en la carpeta.

11.	11.	En el campo Nombre archivo, introduzca un nombre para el nuevo archivo .dc.

12.	12.	Haga clic en Guardar para crear el archivo .dc y transferirlo al software Trimble Survey Controller.

NOTA: Si se están transfiriendo datos de o al software Trimble Survey Controller versión 7.60, use el formato de archivo .dc de la versión 7.50.


Diálogo Opciones colector de datos

Utilice este diálogo para especificar el tipo de colector de datos al que va a exportar datos.

Para acceder a este diálogo:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione una de las siguientes opciones:

  	Puntos MDT al archivo

  	Puntos MDT al Survey Controller

  	Biblioteca de caract. y atributos al Survey Controller

  	Archivos SDR

  	Survey Controller

  	Archivos Survey Controller

4.	Haga clic en Opciones.

NOTA: Los campos que están disponibles dependen de la opción que se selecciona.

Versión

Seleccione la versión relacionada con el formato de datos.

Nombre trabajo / Nombre de archivo

Muestra el nombre del trabajo o tipo de archivo a exportar. Cuando se exporta un trabajo se introduce por defecto el nombre del proyecto Trimble Geomatics Office. Utilice el teclado para introducir un nuevo nombre para el archivo.

Sacar características y atributos

Seleccione esta casilla de verificación para transferir la biblioteca de características y atributos utilizada para el proyecto y cualquier información de características y atributos asignados a los puntos del proyecto que se están exportando. Esta opción sólo está disponible en las versión 7-00 ó posterior de Survey Controller.

Exportar líneas y arcos

Seleccione esta casilla de verificación para exportar líneas y arcos usados en el proyecto a Trimble Survey Controller. Esta opción solo está disponible si tiene líneas y arcos incluidos en el conjunto de selección y solo está disponible para Trimble Survey Controller 10.00 ó posterior.

Sacar como

Seleccione la salida de puntos al archivo de colector de datos.

La salida puede ser como posiciones WGS-84 o como posiciones de cuadrícula. Según el formato de datos y la versión que selecciona y la definición de sistema de coordenadas de la base de datos, ambas opciones no estarán siempre disponibles. Por ejemplo, las versiones del software Trimble Survey Controller anteriores a la 4.00 sólo aceptan posiciones WGS-84; las versiones del SDR20 de Sokkia sólo acepta posiciones de cuadrícula.

El sistema de coordenadas del proyecto puede influir sobre la salida de datos a los archivos de Trimble Survey Controller. Las cuadrículas del datum (por ejemplo, NAD83 HPGN, y NADCON) y los métodos de transformación de datum por regresión múltiple no son soportados por el software Trimble Survey Controller versión 6.50 ó anteriores. El software Trimble Survey Controller versión 7.00 soporta las cuadrículas del datum.

Si se exportan datos que no soportan el método de transformación de datum especificado en el proyecto al software Trimble Survey Controller, el registro Datum en el archivo .dc creado configura el método de datum en Ninguno. Las posiciones de cuadrícula incorrectas no pueden mostrarse en el software Trimble Survey Controller. Para más información, véase el tema Métodos de transformación de datum y software Trimble Survey Controller.

Similarmente, el software Trimble Survey Controller versión 4.00 no puede funcionar con modelos geoidales. Si un proyecto utiliza uno de estos modelos, el método de datum también se habrá configurado en Ninguno. Esto asegura que el software Trimble Survey Controller versión 4.00 no muestre datos incorrectos.

Para utilizar en el campo datos de coordenadas de cuadrícula previamente cargados hay que realizar una calibración de campo para relacionar los datos de cuadrícula con los datos GPS observados. Para más información, véase el tema Modelos geoidales y Survey Controllers.

Detalles del archivo

Seleccione la casilla de verificación Añadir archivo para incluir datos de un archivo .dc ya existente en la exportación. El botón Examinar estará disponible. Haga clic en Examinar para localizar el archivo .dc que desea incluir en el nuevo archivo. Los datos del proyecto actual se añadirán luego al archivo nuevo.

Esta opción resulta útil si tiene un archivo .dc que contiene puntos de control que desea añadir a los datos que se han de exportar. Esto preserva el archivo .dc existente en su estado original.


Unidades del colector de datos

Cuando se importa un archivo Trimble Survey Controller (.dc) o un archivo con formato SDR, la definición de unidades en la cabecera del archivo se utiliza para la conversión de unidades. El software Trimble Geomatics Office opera siempre con datos internos SI (métricos), así que los datos importados de un archivo colector de datos se convierten adecuadamente.

Para seleccionar cómo se han de mostrar los valores en la pantalla:

1.	Seleccione Archivo / Propiedades proyecto.

Aparecerá el diálogo Propiedades proyecto.

2.	Seleccione la ficha Unidades y formato.

Utilice esta ficha para seleccionar las unidades de presentación.

NOTA: Los archivos SDR sólo tienen configuraciones de unidades de distancia en pies y metros. Para los archivos SDR, los valores en pies se interpretan como valores en pies topográficos USA si las unidades de coordenadas se han configurado como pies topográficos USA.


Opción Notas de atributos del archivo DC (Survey Controller V4)

Los archivos de notas de atributos son archivos simples, delimitados por comas. Estos archivos contienen atributos de puntos capturados como notas de atributos en un colector de datos en el que se ejecute el software Trimble Survey Controller (versión 3.00 ó 4.00). Esta opción no sirve para exportar atributos capturados mediante una biblioteca de características y atributos (disponible con el software Trimble Survey Controller versión 7.00 ó posterior).

Utilice esta opción para exportar únicamente atributos capturados mediante registros de notas.

El proceso es como sigue:

1.	Importe al proyecto de Trimble Geomatics Office un archivo del software Trimble Survey Controller versión 3.00 ó 4.00 que contenga notas de atributos.

El software Trimble Geomatics Office crea un conjunto de selección. A este conjunto de selección se le asigna un nombre igual al nombre de trabajo interno del archivo.

2.	Seleccione el conjunto de selección creado. El conjunto de selección se usa para leer puntos del proyecto para el archivo de atributos.

3.	Exporte el archivo .dc con las notas de atributos.

A continuación se ofrece un ejemplo del tipo de archivo que se produce:

1000,5315.362,1056.274,82.361,ARBOL,TIPO,PINO,ALTURA,25,DIAMETRO,0.5

1001,5382.728,1132.692,75.472, ARBOL,TIPO,ABEDUL,ALTURA,20,DIAMETRO,0.4

1002,5298.048,1162.472,55.927,PP,VOLTAjE,110KV,CABLES,3

1003,5308.682,1192.329,62.854,PP,VOLTAjE,110KV,CABLES,3


Opción Puntos MDT al Survey Controller

Utilice esta opción para exportar puntos MDT a un colector de datos en el que se ejecute el software Trimble Survey Controller.

Para hacerlo:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Puntos MDT a Survey Controller.

4.	Haga clic en Opciones para especificar el nombre del archivo y la versión del software Survey Controller al que se efectúa la exportación.

5.	Haga clic en Aceptar para aceptar las configuraciones y volver al diálogo Exportar.

6.	Haga clic en Aceptar. Aparecerá el diálogo Transferencia de datos / Guardar como.

Los puntos seleccionados para exportar deben ser puntos regularmente cuadriculados. Es decir, deben formar una cuadrícula de puntos orientados Norte-Sur y Este-Oeste con un espaciamiento idéntico entre puntos en cualquier dirección. Por lo general, los puntos cuadriculados se importan al sistema desde un archivo ASCII de coordenadas. Debe asegurarse de que sólo se elijan para exportación los puntos de la cuadrícula, y que no se haya incluido en la selección actual ningún punto que no pertenezca a la misma.

Una vez seleccionada la opción para exportar, el sistema Trimble Geomatics Office ordena los puntos de la cuadrícula seleccionados en el orden apropiado y crea el archivo de formato especial requerido por el software Trimble Survey Controller.


Opción Puntos MDT al archivo (*.dtx)

Utilice esta opción para exportar puntos MDT a un archivo Modelo Digital del Terreno (*.dtx).

Para hacerlo:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Puntos MDT al archivo (*.dtx).

4.	Haga clic en Opciones para especificar el nombre del archivo y la versión del software Survey Controller a la que se efectúa la exportación.

5.	Haga clic en Aceptar para aceptar las configuraciones y volver al diálogo Exportar.

6.	Haga clic en Aceptar. Aparecerá el diálogo Guardar como.

7.	Introduzca el nombre del archivo y seleccione la carpeta en la que desea que se guarde.

8.	Haga clic en Aceptar.

Los puntos seleccionados para exportar deben ser puntos regularmente cuadriculados. Es decir, deben formar una cuadrícula de puntos orientados Norte-Sur y Este-Oeste con un espaciamiento idéntico entre puntos. Por lo general, los puntos cuadriculados se importan al sistema de un archivo ASCII de coordenadas. Debe asegurarse de que sólo se elijan para exportación los puntos de la cuadrícula, y que no se haya incluido en la selección actual ningún punto que no pertenezca a la misma.

Una vez seleccionada la opción para exportar, el sistema Trimble Geomatics Office ordena los puntos de la cuadrícula seleccionados en el orden apropiado y crea el archivo con formato Modelo Digital del Terreno (*.dtx).


Opción Cuadrícula del datum al Survey Controller (*.cdg)

Más información

Cómo ...	Véase también

Utilice esta opción para crear Archivos de la cuadrícula del datum combinados para transferir al software Trimble Survey Controller.

Para hacerlo:

1.	 Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento..

3.	Seleccione la opción Cuadrícula del datum al Survey Controller (*.CDG).

Aparecerá el diálogo Exportar cuadrícula de datum.

Los archivos de cuadrícula del datum almacenan transformaciones para el área definida. Mediante la utilidad Trimble Coordinate System Manager (Administrador de sistemas de coordenadas de Trimble) se puede definir un sistema de coordenadas que utilice un Arch. de la cuad del datum como transformación de datum del sistema (por ejemplo, NADCON). Luego se podrá seleccionar un sistema de coordenadas que utilice una cuadrícula del datum para el proyecto de Trimble Geomatics Office. Para usar el Arch. de la cuad del datum en el campo es preciso transferir el Arch. de la cuad del datum al software Trimble Survey Controller (versión 7.00 ó posterior) como un Arch. de la cuad del datum combinado. Para obtener información sobre los métodos de transformación de datum disponibles para distintas versiones de Trimble Survey Controller, véase el tema Transformaciones de datum y Survey Controllers.

La carpeta Archivos del programa \ Archivos comunes \ Trimble \ Geodata contiene un archivo de cuadrícula de latitud y un archivo de cuadrícula de longitud para la cuadrícula del datum que se haya seleccionado. Estos archivos deben combinarse antes de exportarlos al software Trimble Survey Controller. El software combina los archivos asociados con la cuadrícula del datum especificada en el sistema de coordenadas del proyecto cuando se elige la opción Crear Arch. de la cuad del datum combinado para exportar al software Trimble Survey Controller.

Cuando se crea un Arch. de la cuad del datum combinado y se utiliza con el software Trimble Survey Controller, el nombre de la cuadrícula del datum original se almacena en el archivo .dc, por ejemplo NADCON (HPGN).

Si el archivo .dc se importa al software Trimble Geomatics Office, éste utiliza dicho nombre para determinar si el sistema de coordenadas usado en el campo coincide con el sistema de coordenadas definido para el proyecto de Trimble Geomatics Office.

NOTA: A partir del Arch. de la cuad del datum actual sólo se puede crear un Arch. de la cuad del datum combinado pero se puede exportar cualquier cuadrícula del datum combinada.

Se puede:

  transferir un Arch. de la cuad del datum (.cdg) combinado ya existente.

  crear un nuevo Arch. de la cuad del datum (.cdg) combinado para exportarlo al software Trimble Survey Controller.

NOTA: Para combinar los Arch. de la cuad del datum se puede usar también la utilidad Trimble Grid Factory™. Para instalar esta utilidad use la opción de instalación personalizada de Trimble Geomatics Office.


Transformaciones de datum y Trimble Survey Controllers

El software Trimble Geomatics Office soporta el uso de Cuadrículas del datum y de definiciones de Regresión múltiple para las transformaciones de datum.

La base de datos del sistema de coordenadas que se suministra con el software proporciona cierto número de definiciones de sistemas de coordenadas que emplean estos métodos de transformación de datum

Las versiones del software Trimble Survey Controller anteriores a la versión 7.00 no soportan ninguno de estos tipos de transformaciones de datum. El software Trimble Survey Controller versión 7.00 soporta las cuadrículas de datum.

El software Trimble Geomatics Office no puede crear:

  un archivo .dc en una versión 6.50 ó anterior de Trimble Survey Controller que haga referencia a cualquiera de estos métodos de transformación de datum.

 un archivo .dc en la versión 7.00 de Trimble Survey Controller que haga referencia a una transformación de datum por regresión múltiple.

Cuando se exportan puntos de un proyecto que utiliza un método no soportado a un archivo .dc de Trimble Survey Controller, el software Trimble Geomatics Office produce la salida del registro del datum con el método configurado en Ninguno.

Esto significa que en el software Trimble Survey Controller no es posible cambiar la vista del punto entre posiciones WGS-84 y de la cuadrícula. También significa que en el trabajo de campo es necesario realizar una calibración si se han transferido posiciones de la cuadrícula antes de llevar a cabo otros trabajos de campo usando dichos puntos.

Si las posiciones de la cuadrícula se han transferido con fines de calibración, esto carece de importancia. Si se han transferido las posiciones WGS-84 se puede comenzar el replanteo inmediatamente. Sin embargo, no es posible ver coordenadas de la cuadrícula a menos que se realice una calibración en el campo.


Diálogo Exportar cuadrícula de datum

Utilice esta opción para exportar un archivo de cuadrícula del datum (*.cdg).

Para acceder a esta opción:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Cuadrícula del datum al Survey Controller (*.cdg).

4.	Haga clic en Aceptar.

Al seleccionar la opción Cuadrícula del datum al Survey Controller (*.CDG), aparecerá el diálogo Exportar cuadrícula de datum.

Exportar Arch. de la cuad del datum combinado existente al Survey Controller

Seleccione esta opción para exportar un Arch. de la cuad del datum combinado al software Trimble Survey Controller (versión 7.00 ó posterior). Usted puede elegir exportar cualquiera de los archivos de la cuadrícula del datum combinados que existan en la carpeta GeoData. Si se selecciona esta opción aparecerá el diálogo Seleccionar.

Crear archivo de cuadrícula de datum combinado para exportarlo al Survey Controller

Seleccione esta opción para crear un nuevo Arch. de la cuad del datum combinado mediante el Arch. de la cuad del datum utilizado por el sistema de coordenadas del proyecto actual. Aparecerá el diálogo Crear Arch. de la cuad del datum combinado.


Diálogo Guardar como (Exportar cuadrícula del datum \ cuadrícula del geoide)

Utilice este diálogo para introducir un nombre para el Arch. de la cuad del datum combinado (*.cdg) o para el Archivo de cuadrícula de geoide (*.ggf).

Haga clic en Aceptar para abrir el dialogo Transferencia de datos / Guardar como.


Diálogo Crear Arch. de la cuad del datum combinado

Utilice este diálogo para definir el área para la que se desea crear un Arch. de la cuad del datum combinado (*.cdg). Luego puede enviar al software Trimble Survey Controller el Arch. de la cuad del datum combinado para su uso en el campo.

Para crear un archivo .cdg, el sistema de coordenadas del proyecto debe usar una cuadrícula del datum para el sistema de coordenadas. Para obtener información sobre el uso de Arch. de la cuad del datum, véase la Ayuda en pantalla de la utilidad Trimble Coordinate System Manager™.

Para acceder a esta opción:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Cuadrícula del datum al Survey Controller.

4.	Haga clic en Aceptar. Aparecerá el diálogo Exportar cuadrícula del datum.

5.	Seleccione la opción Crear cuadrícula del datum combinada para exportar al Survey Controller.

6.	Haga clic en Aceptar.

El cuadro amarillo en el globo define el área cubierta por los Arch. de la cuad de latitud y longitud.

Utilice las herramientas para arrastrar un cuadro sobre un área del globo dentro de la cuadrícula del datum que desea que cubra la cuadrícula del datum combinada.

Propiedades del archivo

El grupo Propiedades del archivo muestra los archivos que se están utilizando para crear el archivo .cdg.

Cuadrícula del datum

Muestra el Arch. de la cuad del datum que se está utilizando para crear el archivo .cdg.

Archivo cuad latitud

Muestra el archivo de la cuadrícula latitud que se está utilizando para crear el archivo .cdg.

Archivo cuad longitud

Muestra el archivo de la cuadrícula longitud que se está utilizando para crear el archivo .cdg.

Propiedades cuadrícula

El grupo Propiedades cuadrícula muestra las propiedades de cuadrícula de la cuadrícula que se está definiendo.

Límites latitud

Muestra los limites de latitud del cuadro actual.

Límites longitud

Muestra los limites de longitud del cuadro actual.

Tamaño archivo

Muestra el tamaño del archivo .cdg creado. El valor en Tamaño archivo cambia conforme se cambia la forma del cuadro sobre el globo.

Nombre Survey Controller

Muestra el nombre interno del archivo .cdg que será utilizado en el Trimble Survey Controller. El campo Nombre  Survey Controller adopta por defecto el nombre de la cuadrícula del datum original. Si el archivo .cdg se utiliza en un trabajo de Trimble Survey Controller, se hará referencia al nombre interno. Durante la importación del archivo colector de datos (*.dc), el software Trimble Geomatics Office utiliza el nombre interno para determinar si la cuadrícula del datum combinada usada en el archivo .dc coincide con la cuadrícula del datum para el proyecto de Trimble Geomatics Office.

NOTA: Si edita este campo asegúrese de que sólo añade al nombre un sufijo o prefijo. Esto asegura que el nombre sea único y todavía permite que sea reconocida la cuadrícula del datum original. No se puede continuar hasta que el campo Nombre Survey Controller contenga el nombre de la cuadrícula del datum.

Propiedades globo

El grupo Propiedades globo muestra la posición del cursor y proporciona opciones para configurar la apariencia del globo.

Posición cursor

Muestra la posición actual en latitud y longitud del puntero del ratón dentro del globo.

Muestra límites estatales

Seleccione esta casilla de verificación para mostrar los límites estatales en el globo.

Muestra límites nacionales

Seleccione esta casilla de verificación para mostrar los límites nacionales en el globo.

Muestra ríos

Seleccione esta casilla de verificación para mostrar los ríos en el globo.


Opción Archivo de geoide a Survey Controller (*.ggf)

Más información

Cómo ...	Diálogo	Véase también

Visión de conjunto

Los archivos de cuadrícula de geoide (*.ggf) almacenan la separación entre el elipsoide WGS-84 y el geoide para el área definida. Para obtener información acerca de los modelos geoidales, véase el tema Modelos geoidales − Visión de conjunto.

Si se usa un archivo .ggf como parte del sistema de coordenadas para un proyecto de Trimble Geomatics Office, se calculan las elevaciones aproximadas de los puntos GPS. Para usar un archivo .ggf en el campo, utilice el software Trimble Geomatics Office para transferir el archivo .ggf al software Trimble Survey Controller (versión 6.00 ó posterior).

Para hacerlo:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	2.	Seleccione la ficha Levantamiento.

3.	3.	Seleccione la opción Archivo de geoide a Survey Controller.

Aparecerá el diálogo Exportar modelo geoidal .

Con esta opción, usted puede seleccionar:

  Transferir cualquier archivo .ggf en la carpeta Archivos del programa\Archivos comunes\Trimble\Geodata.

  Dividir en subcuadrículas el archivo .ggf utilizado en el proyecto de Trimble Geomatics Office actual para extractar un Archivo de cuadrícula de geoide menor. Este proceso reduce el tamaño del archivo .ggf que se envía al colector de datos TSC1 en el que se ejecuta el software Trimble Survey Controller (versión 6.00 ó posterior).

Para obtener información acerca del soporte para modelos geoidales para distintas versiones del software Trimble Survey Controller, véase el tema Modelos geoidales y Survey Controllers.

Cuando se crea un nuevo archivo .ggf mediante la división en subcuadrículas se almacenará el nombre del modelo geoidal original (por ejemplo, GEOID96 Conus). Este nombre interno se incluye también en los archivos .dc que utilizan el archivo .ggf subdividido. Durante la importación de un archivo .dc, el software Trimble Geomatics Office utiliza este nombre para determinar si el modelo geoidal usado en el campo coincide con el modelo geoidal definido para el proyecto de Trimble Geomatics Office.

NOTA: Para dividir en subcuadrículas los archivos del modelo geoidal se puede usar también la utilidad Trimble Grid Factory. La utilidad Grid Factory es parte de la opción personalizada en la instalación del software Trimble Geomatics Office.


Opción Archivo de geoide al TDS Survey Pro CE (*.ggf)

Más información

Cómo ...	Diálogo	Véase también
Visión de conjunto

Los archivos de cuadrícula de geoide (*.ggf) almacenan la separación entre el elipsoide WGS-84 y el geoide para el area definida. Véase más información sobre modelos geoidales en el tema Modelos geoidales − Visión de conjunto.

Si se utiliza un archivo .ggf como parte del sistema de coordenadas para un proyecto de Trimble Geomatics Office, se calcularán elevaciones aproximadas para los puntos GPS. Para utilizar un archivo .ggf en el campo, utilice Trimble Geomatics Office para transferir el archivo.ggf a TDS Survey Pro CE (v4 ó posterior.)

Para ello:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos de geoide al TDS Survey Pro CE.

Aparecerá el diálogo Exportar modelo geoidal.

Con esta opción, podrá optar por:

  Transferir archivos .ggf en la carpeta Archivos de programa\Archivos comunes\Trimble\GeoData.

  Subcuadricular archivos .ggf utilizados en el proyecto actual de Trimble Geomatics Office para extraer un archivo de cuadrícula de geoide más pequeño. Este proceso reducirá el tamaño del archivo.ggf que se envía al dispositivo TSCE que ejecuta TDS Survey Pro CE (v4 ó posterior).

NOTA: También podrá utilizar la utilidad Grid Factory para subcuadricular archivos de modelo geoidal. La utilidad Grid Factory forma parte de la opción Personalizada durante la instalación de Trimble Geomatics Office.


Modelos geoidales y software Trimble Survey Controller

Los modelos geoidales pueden transferirse al software Trimble Survey Controller versión 6.00 (o posterior). El software Trimble Survey Controller utiliza estos modelos geoidales cuando cambia la presentación de puntos entre posiciones WGS-84 y posiciones de la cuadrícula (NEE).

Por lo general, los modelos geoidales son archivos muy grandes. Usualmente no es posible cargar un modelo geoidal completo en el software Trimble Survey Controller versión 6.00 (o posterior).

Utilice la opción Archivo / Exportar / Archivos de geoide a Survey Controller para crear un modelo geoidal más pequeño para su área. Luego podrá transferir este archivo más pequeño al software Trimble Survey Controller.

Versiones anteriores del software Trimble Survey Controller

Los siguientes puntos se refieren a versiones anteriores del software Trimble Survey Controller.

Versión 5.00

Esta es una versión militar y no está disponible para el público general.

Versión 4.00

Esta versión no puede funcionar con modelos geoidales. Si el software Trimble Geomatics Office tuviera que escribir en un archivo .dc del software Trimble Survey Controller versión 4 una definición completa de un sistema de coordenadas seguida de las posiciones de los puntos tales como posiciones de la cuadrícula o WGS-84, podrían verse alturas/elevaciones incorrectas en el software Trimble Survey Controller.

Esto ocurriría dentro del software Trimble Survey Controller al cambiar la vista de datos, lo que haría que se mostraran alturas WGS-84 incorrectas cuando se hubieran transferido posiciones de la cuadrícula, y elevaciones incorrectas de puntos de la cuadrícula cuando se hubieran transferido posiciones WGS-84.

Para evitar que esto ocurra, el software Trimble Geomatics Office produce la salida del registro de datum desde la definición del proyecto, luego avisa que no es posible convertir valores entre NEE y WGS-84 debido a un modelo geoidal, y alertará de que se ha añadido una transformación en blanco. A esto le sigue otro registro de datum con el método configurado en Ninguno. Los registros de datum posteriores siempre sobrescriben al anterior. Esto significa que en el software Trimble Survey Controller versión 4.00 no es posible cambiar la vista de puntos entre posiciones WGS-84 y de la cuadrícula. Esto evita la presentación de cualquier valor erróneo.

Para el trabajo de campo, esto significa que si se cargan posiciones de la cuadrícula hay que realizar una calibración. Esta debe hacerse antes de realizar cualquier trabajo de campo nuevo utilizando estos puntos. (Esto no es un problema si las posiciones de la cuadrícula se han transferido para fines de calibración).

NOTA: Si se transfieren posiciones WGS-84 se puede realizar un replanteo inmediatamente. Sin embargo, no es posible ver coordenadas de la cuadrícula a menos que se realice una calibración en el campo.

Versiones anteriores a la versión 4.00

Las versiones anteriores del software Trimble Survey Controller sólo pueden manejar la carga de posiciones WGS-84 y por ello no se ven afectadas por el empleo de un modelo geoidal en un proyecto.


Diálogo Exportar modelo geoidal

Cuando se selecciona la opción Archivo de geoide a Survey Controller (*.ggf), o la opción Archivos de geoide al TDS Survey Pro CE (*.ggf), aparece el diálogo Exportar modelo geoidal.

Exportar modelo geoidal existente al Survey Controller

Seleccione esta opción para exportar un Archivo de cuadrícula de geoide a Trimble Survey Controller (versión 6.00 ó posterior) o a TDS Survey Pro CE (versión 4.00 ó posterior). Se puede exportar cualquiera de los Archivos de cuadrícula de geoide que exista en la carpeta GeoData. Si se selecciona esta opción aparece el diálogo Seleccionar.

Crear subcuadrícula de modelo geoidal para exportarla al Survey Controller

Seleccione esta opción para dividir en subcuadrículas el Archivo de cuadrícula de geoide utilizado en el sistema de coordenadas del proyecto actual. Aparecerá el diálogo Crear archivo de la cuadrícula del geoide.


Diálogo Crear archivo de la cuadrícula del geoide

Utilice este diálogo para definir el área para la que desea crear un nuevo Archivo de cuadrícula de geoide que esté basado en el Archivo de cuadrícula de geoide usado por el sistema de coordenadas del proyecto.

Para acceder a esta opción:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo de geoide a Survey Controller (*.ggf) o la opción Archivos de geoide al TDS Survey Pro CE (*.ggf).

4.	Haga clic en Aceptar. Aparecerá el diálogo Exportar modelo geoidal.

5.	Seleccione la opción Crear una subcuadrícula de un modelo geoidal para exportar.

6.	Haga clic en Aceptar.

El cuadro amarillo en el globo define el área cubierta por el modelo geoidal.

Utilice las herramientas para arrastrar un cuadro sobre un área del globo dentro del modelo geoidal que desee que cubra la cuadrícula del geoide. Se mostrará el tamaño del archivo del cuadro actual.

Propiedades del archivo

El grupo Propiedades del archivo muestra las propiedades del Archivo de cuadrícula de geoide que se está utilizando para crear el archivo .ggf.

Geoide

Muestra el modelo geoidal que se está utilizando en el sistema de coordenadas del proyecto.

Archivo de cuadrícula de geoide

Muestra el nombre del Archivo de cuadrícula de geoide que se está utilizando en el modelo geoidal.

Propiedades cuadrícula

El grupo Propiedades cuadrícula muestra las propiedades de la cuadrícula que se está definiendo.

Límites latitud

Muestra los limites de latitud del cuadro actual.

Límites longitud

Muestra los limites de longitud del cuadro actual.

Tamaño archivo

Muestra el tamaño del Archivo de cuadrícula de geoide que será creado. El valor en Tamaño archivo cambia conforme se cambia la forma del cuadro sobre el globo.

Nombre

Muestra el nombre interno del archivo de subcuadrícula que será utilizado en el Trimble Survey Controller. El campo Nombre Survey Controller adopta por defecto el nombre de la cuadrícula del modelo geoidal original. Si el archivo .ggf se utiliza en un trabajo de Trimble Survey Controller, se hará referencia al nombre interno. Durante la importación del archivo colector de datos (*.dc), el software Trimble Geomatics Office utiliza el nombre interno para determinar si el modelo geoidal original utilizado en el archivo .dc coincide con modelo geoidal definido para el proyecto de Trimble Geomatics Office.

NOTA: Si edita este campo asegúrese de que sólo añade al nombre un sufijo o prefijo. Esto asegura que el nombre sea único y todavía permite que el modelo geoidal original sea reconocido en la importación. No se puede continuar hasta que el campo Nombre Survey Controller contenga el nombre del modelo geoidal.

Propiedades globo

El grupo Propiedades globo muestra la posición del cursor y proporciona opciones para configurar la apariencia del globo.

Posición cursor

Muestra la posición actual en latitud y longitud del puntero del ratón dentro del globo.

Muestra límites estatales

Seleccione esta casilla de verificación para mostrar los límites estatales en el globo.

Muestra límites nacionales

Seleccione esta casilla de verificación para mostrar los límites nacionales en el globo.

Muestra ríos

Seleccione esta casilla de verificación para mostrar los ríos en el globo.

NOTA: Para dividir en subcuadrículas los archivos del modelo geoidal se puede usar también la utilidad Trimble Grid Factory. La utilidad Grid Factory es parte de la opción personalizada en la instalación del software Trimble Geomatics Office.


Opción Biblioteca de caract. y atributos al Survey Controller

  Visión de conjunto y más información

Para exportar una biblioteca de características y atributos al software Trimble Survey Controller:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Biblioteca de caract. y atributos al Survey Controller (*.fcl). 	Aparecerá el Dialogo Seleccionar biblioteca de caract. y atributos.

Utilice esta opción para exportar una biblioteca de características y atributos al software Trimble Survey Controller a fin de que pueda capturar códigos de características en el campo. También puede utilizar la biblioteca de características y atributos para capturar atributos para códigos de características que tengan atributos definidos.


Diálogo Seleccionar biblioteca de caract. y atributos

Utilice este diálogo para seleccionar la biblioteca de características y atributos que desea transferir al software Trimble Survey Controller.

Examinar

Haga clic en Examinar para seleccionar una biblioteca.

Archivo

El valor por defecto en el campo Archivo es el nombre del último archivo exportado.

Exportar atributos

Seleccione esta casilla de verificación para exportar las definiciones de atributos contenidas en la biblioteca de características y atributos. Esto sólo es posible si se está exportando a Trimble Survey Controller versión 7.00 ó posterior.

Utilice esta opción si desea capturar información de atributos en el campo.

Si inhabilita esta casilla de verificación no se exportará ningún atributo definido en el archivo de biblioteca. Este campo no está disponible se está exportando al software Trimble Survey Controller versión 6.50 ó anterior.

Aceptar

Haga clic en Aceptar una vez que haya elegido la biblioteca de códigos de características apropiada.

Aparecerá el diálogo Transferencia de datos / Guardar como.

NOTA: Los códigos de control también se exportarán.


Diálogo Opciones biblioteca de caract. y atributos

Utilice este diálogo para configurar la versión del software Trimble Survey Controller a la que se va a exportar.

Para acceder a este diálogo:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione opción Biblioteca de caract. y atributos al Survey Controller.

4.	Haga clic en Opciones.

Versión

Si se selecciona una versión del Software Trimble Survey Controller anterior a la versión 7.00, la casilla de verificación Exportar atributos en el diálogo Seleccionar biblioteca de caract. y atributos no estará disponible. Esto se debe a que dichas versiones no soportan atributos.


Opción Diccionario de datos a Survey Controller (*.ddf)

 Visión de conjunto y más información

Utilice esta opción para exportar un archivo diccionario de datos al software Trimble Survey Controller versión 7.00 ó posterior. En el software Trimble Survey Controller, use el archivo diccionario de datos para capturar atributos.

Para exportar archivo diccionario de datos al software Trimble Survey Controller:

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivo diccionario de datos a Survey Controller (*.ddf).

4.	Haga clic en Aceptar.

Aparecerá el diálogo Seleccionar.


Diálogo Seleccionar (Archivos Diccionario de datos al software Trimble Survey Controller)

Utilice este diálogo para seleccionar el archivo Diccionario de datos (*.ddf) que desea transferir  al software Trimble Survey Controller.

Al hacer clic en Abrir, aparecerá el diálogo Transferencia de datos / Guardar como.


Transferencia de datos del software Trimble Survey Controller - Visión de conjunto
Transferencia de datos del software Trimble Survey Controller − Visión de conjunto

 Cómo ...

Visión de conjunto

Se podrá conectar a un colector de datos en el que se ejecute el software Trimble Survey Controller y transferir trabajos al software Trimble Geomatics Office. Durante la importación, los trabajos se convierten a archivos de colector de datos (*.dc). Para hacerlo, debe tener un dispositivo Survey Controller instalado en la utilidad Trimble Data Transfer (Transferencia de datos de Trimble).

NOTA: Si algunos trabajos tienen archivos de datos brutos GPS Trimble GPS (*.dat) asociados a ellos, los archivos .dat se importan con los trabajos. Si se importa un archivo .dat más de una vez al mismo proyecto, las ocupaciones existentes en el proyecto no se seleccionarán por defecto en el diálogo Comprobar DAT.

Durante la importación de un archivo .dc, el software Trimble Geomatics Office usa la clase asignada a cada punto en el software Trimble Survey Controller y el método utilizado para determinar la posición del punto para asignar una calidad de punto al punto. Un recálculo usa la calidad para determinar la posición calculada para el punto.

NOTA: Si se están transfiriendo datos de o a una versión 7.60 de Trimble Survey Controller, use el formato de archivo .dc de la versión 7.50.

NOTA: Si va a realizar un ajuste de la red utilizando datos descargados de un Trimble Survey Controller, asegúrese de introducir una corrección de presión, temperatura, curvatura y refracción en el Estilo levantamiento del Survey Controller al realizar el levantamiento.


Registros de notas - Visión de conjunto
Registros de notas − Visión de conjunto

Las notas en un proyecto son notas introducidas por el usuario desde el software Trimble Survey Controller. En el proyecto no se incluye ninguna nota de información topográfica tal como ‘Inicialización lograda’ e ‘Inicialización perdida.

Los registros de notas se emplean en versiones antiguas del software Trimble Survey Controller con los siguientes fines:

Si está utilizando versiones antiguas del software Trimble Survey Controller y quiere utilizar registros de notas, elija el diálogo Seleccionar / Por tipos para seleccionar todos los registros de nota en el proyecto.


Archivos Sokkia Data Recorder (*.sdr)

El software Trimble Geomatics Office soporta datos con formato de archivo Sokkia Data Recorder (archivo del colector de datos de Sokkia) (*.sdr).

Mediante el software Trimble Geomatics Office se puede:

  importar un archivo Sokkia Data Recorder (*.sdr) a un proyecto de Trimble Geomatics Office.

  exportar un proyecto de Trimble Geomatics Office a un archivo Sokkia Data Recorder (*.sdr).

Para importar un archivo Sokkia Data Recorder (*.sdr):

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos Sokkia Data Recorder (*.sdr). Aparecerá el diálogo Abrir.

4.	Seleccione el archivo en una carpeta que desea importar y haga clic en Abrir.

Para exportar el proyecto actual de Trimble Geomatics Office a un archivo Sokkia Data Recorder (*.sdr).

1.	Seleccione Archivo / Exportar. Aparecerá el diálogo Exportar.

2.	Seleccione la ficha Levantamiento.

3.	Seleccione la opción Archivos SDR (*.sdr).

4.	Haga clic en Opciones para abrir el diálogo Opciones colector de datos a fin de especificar el nombre interno del archivo y la versión del archivo Sokkia Data Recorder.

5.	Haga clic en Aceptar para aceptar las configuraciones y volver al diálogo Exportar.

6.	Haga clic en Aceptar. Aparecerá el diálogo Guardar como.

7.	Seleccione la carpeta a la que quiere exportar el archivo, introduzca un nombre de archivo y haga clic en Guardar.


Transferencia de archivos de la cuadrícula nacional del Reino Unido al software Trimble Survey Controller

Cómo ...

Utilice la utilidad Trimble Data Transfer para transferir archivos de la cuadrícula nacional del Reino Unido (*.pgf) directamente a un Trimble Survey Controller versión 7.5 ó posterior.

Se pueden transferir cualesquiera de los archivos .pgf existentes localizados en la carpeta Archivos del programa \ Archivos comunes \ Trimble \ Geodata.

NOTA: Esta opción de exportación sólo está disponible al ejecutar la utilidad Trimble Data Transfer en el modo autónomo. La misma no está disponible en el diálogo Exportar en el software Trimble Geomatics Office.


Rellenar campo - Visión de conjunto
Rellenar campo − Visión de conjunto

Más información

 Cómo ...

Visión de conjunto

Utilice Rellenar campo para introducir valores en los campos. Por ejemplo, usted puede completar un campo de capa haciendo clic en un punto que se encuentre en la capa deseada.

En los campos que soportan esta opción, el puntero de la ventana gráfica se muestra de esta forma:

NOTA: Si la entidad seleccionada en la ventana gráfica no puede proporcionar el valor requerido en el campo resaltado, el campo del diálogo no se alterará.

Algunos campos se completan con un grupo de valores. Un único clic rellena todos los campos agrupados. Por ejemplo, los campos Norte, Este y Elevación generalmente forman un grupo. Para rellenar solo un campo, seleccione el mismo, mantenga presionada Alt y a continuación haga clic.

El resalte de Trimble Geomatics Office se mueve al siguiente campo vacío después de rellenar el campo.

Usos especiales de Rellenar campo

Rellenar campo tiene las siguientes funciones especiales:

  Para introducir el valor de acimut opuesto cuando se complete un campo de acimut, mantenga presionada Mayús y haga clic. Rellenar campo no puede utilizarse para el campo Acimut cuando se añadan puntos por acimut y distancia.

  Si se mantiene presionada Ctrl mientras se utiliza Rellenar campo se evita el salto a entidades—sólo se eligen coordenadas. De esta forma se pueden seleccionar coordenadas próximas a una entidad.

  Utilice los comandos del menú Ver (por ejemplo, Zoom y Pan) para ubicar entidades con los valores que requiera para completar los campos. Una vez ubicadas, usted debe volver a activar el campo antes de copiar el valor.


Introducción de ángulos

Los dígitos a la derecha del punto decimal se interpretan según las configuraciones de unidades, formato y ángulo.

Para especificar el formato, utilice la ficha Unidades y formatos del diálogo Propiedades del proyecto. Para acceder al mismo, seleccione Archivo / Propiedades proyecto.

Por ejemplo:

Introducción de los dígitos 10.1234


Conversión de unidades

Para configurar las unidades de presentación de campos con unidades (tales como, visualización en pantalla, importación, exportación, e informe), utilice la ficha Unidades y formato del diálogo Propiedades proyecto.

Todos los valores numéricos introducidos en un campo se interpretan como unidades con el valor especificado en el sistema. Por ejemplo, con la configuración de elevación especificada en metros, todos los valores numéricos introducidos en un campo de elevación se interpretan en metros.

Esta configuración puede sobrescribirse tecleando el valor numérico seguido de una entrada alfabética.

El sistema le permite introducir otros valores si especifica una unidad. Por ejemplo, si introduce una elevación como ‘25 Ps USA’, Trimble Geomatics Office reconoce la unidad (pies topográficos USA) y la interpreta con el valor apropiado.

La tabla siguiente indica los valores correspondientes a cada unidad:


Arrastre de entidades

Para mover o rotar una entidad seleccionada con el ratón, utilice la entidad seleccionada con el ratón y use los controladores de tamaño.

Por ejemplo, usted puede cambiar la posición de una anotación para que presente mejor la información que contiene y mejore la disposición de la ventana gráfica principal.

Texto/Anotaciones

Para arrastrar texto o entidades de anotación, seleccione el texto, anotaciones, o ambos, mueva el puntero del ratón sobre el marco de texto y ubique cualquiera de los dos controladores. El puntero del ratón cambia al icono apropiado cuando usted coloque el puntero sobre el ratón. El puntero de arrastre le permite mover la entidad. El puntero de rotación le permite rotarla.

Por ejemplo:

Seleccione el controlador de tamaño que requiera y arrastre. La posición en la que suelte el botón del ratón se mantiene.

NOTA: A no ser que el tipo de ancla esté en posición derecha, el controlador de rotación estará en posición superior derecha. De forma similar, cuando se selecciona un ancla derecha, el controlador de rotación estará en posición superior izquierda.

Los controladores de tamaño pueden ubicarse en las siguientes posiciones:

NOTA: La línea base indica la posición más baja de letras que no incluyen rasgos descendentes. (Es decir, el espacio desde la parte inferior a la línea base es la zona donde se colocan los rasgos descendentes.)

Curvas

Para cambiar la tangente de entrada o la tangente de salida de curvas, seleccione la curva (o curvas), mueva el puntero del ratón sobre la misma y localice los controladores de rotación. Cada curva tiene dos controladores (uno para la tangente de entrada y uno para la de salida).

Cuando se ubique el puntero sobre el controlador de tamaño, el puntero cambia a [image].

El puntero de rotación le permite rotar la curva o curvas seleccionadas.

NOTA: Si tiene dos curvas unidas, ambas pueden rotarse con un controlador de rotación. Trimble Geomatics Office configura y mantiene automáticamente una tangente común entre curvas unidas.

Para saltar a las entidades existentes, mantenga presionada Ctrl. Por defecto, el salto a entidades existentes está inhabilitado.

Puntos

El movimiento de un punto (o puntos) consiste en una simple traslación de puntos de la base de datos. Para mover un punto (o puntos), haga una selección, mueva el puntero sobre el mismo y luego ubique el controlador de edición. El puntero cambia a [image] cuando se coloque sobre el controlador. Cuando el punto se encuentra en la ubicación deseada, suelte el botón. Aparece el diálogo Mover puntos y texto. Use este diálogo para editar y confirmar los valores.

El arrastre de puntos mueve todo el texto y puntos seleccionados.


Puntos sin nombres

En el proyecto, cada entidad se registra con un único controlador. Este es un valor entero único utilizado por Trimble Geomatics Office para identificar el punto. Esto significa que cuando a un punto no se le ha asignado un nombre, Trimble Geomatics Office es capaz de reconocer el punto por su controlador interno.

Cuando un punto sin nombre asignado requiere un nombre (por ejemplo, cuando se selecciona como punto final en el diálogo Añadir punto) aparece el controlador real de la base de datos. El nombre va precedido por el carácter (=). Este es el método de software para identificar el punto que usted ha seleccionado.


Barra de estado

La barra de estado está ubicada al pie de la ventana de gráficos. La misma muestra información sobre el estado actual del software, incluyendo información sobre coordenadas.

Cuando se mueve el ratón sobre el área de visualización de Timeline, la barra de estado muestra información horaria. Podrá mostrarse la hora local de Windows o las semanas/segundos GPS, según las configuraciones de la opción de hora.

Cuando Trimble Geomatics Office realiza ciertas tareas, tal como el procesamiento de líneas base, la barra de estado cambia a un indicador de progreso.

Para obtener más información sobre los indicadores de la barra de estado, véase el Manual de Trimble Geomatics Office.


Barra de estado - Esquina de la ventana
Barra de estado − Esquina de la ventana

La esquina de la ventana le permite cambiar el tamaño de la ventana gráfica principal.


Indicador de progreso

La visualización de la barra de estado cambia a un indicador de proyecto cuando Trimble Geomatics Office realiza ciertas tareas.

Se muestra una descripción breve de la tarea, seguida por un gráfico de barra que indica el porcentaje de la tarea que se ha completado.

Cuando una tarea puede interrumpirse, el indicador de la barra de estado muestra el mensaje Presione ESC para cancelar. Cuando esto aparece, presione Esc para terminar la tarea. Cuando una tarea no puede interrumpirse, este mensaje no aparecerá.


Comando Restaurar

Utilice este comando para volver a poner la ventana activa con su tamaño y posición original.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  Haga clic en el botón de Trimble Geomatics Office [image] de la barra de títulos.

 Haga clic con el botón derecho en la barra de títulos.

  Haga clic en el botón Sistema [image] de la barra de menús.

Se abre el menú Sistema.

2.	Seleccione Restaurar de este menú.


Comando Mover

Utilice este comando para visualizar una flecha con cuatro puntas de forma que usted pueda mover la ventana activa o el cuadro de diálogo con las teclas de flecha.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  Haga clic en el botón de Trimble Geomatics Office [image] de la barra de títulos.

  Haga clic con el botón derecho en la barra de títulos.

  Haga clic en el botón Sistema [image] de la barra de menús.

Se abre el menú Sistema.

2.	Seleccione Mover de este menú.

NOTA: Si se maximiza la ventana, este comando no estará disponible.


Comando Tamaño

Utilice este comando para visualizar una flecha de cuatro puntas de forma que pueda cambiar el tamaño de la ventana activa con las teclas de flecha.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  En la barra de títulos, haga clic en el botón de Trimble Geomatics Office [image].

  Haga clic con el botón derecho en la barra de títulos.

  En la barra de menús, haga clic en el botón Sistema [image].

Se abre el menú Sistema.

2.	Seleccione Tamaño de este menú.

Una vez que el puntero cambie a la flecha de cuatro puntas:

1.	Presione una de las teclas de dirección (izquierda, derecha, hacia arriba, o hacia abajo) para poner el puntero en la esquina que quiere mover.

2.	Presione una tecla de dirección para mover la esquina.

3.	Presione Entrar cuando la ventana tenga el tamaño deseado.

NOTA: Si se maximiza la ventana, este comando no estará disponible.


Comando Minimizar

Utilice este comando para reducir la ventana de Trimble Geomatics Office a un icono.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  En la barra de títulos, haga clic en el botón de Trimble Geomatics Office [image].

  Haga clic con el botón derecho en la barra de títulos.

  En la barra de menús, haga clic en el botón Sistema [image].

Se abre el menú Sistema.

2.	Seleccione Minimizar de este menú.


Comando Maximizar

Utilice este comando para aumentar la ventana activa de forma que rellene todo el espacio disponible.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  En la barra de títulos, haga clic en el botón de Trimble Geomatics Office [image].

  Haga clic con el botón derecho en la barra de títulos.

  En la barra de títulos, haga clic en el botón Sistema [image].

Se abre el menú Sistema.

2.	Seleccione Maximizar de este menú.


Comando Cerrar

Utilice este comando para cerrar el cuadro de diálogo o la ventana activa.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  En la barra de títulos, haga clic en el botón de Trimble Geomatics Office [image].

  Haga clic con el botón derecho en la barra de títulos.

  En la barra de menús, haga clic en el botón Sistema [image].

Se abre el menú Sistema.

2.	Seleccione Cerrar de este menú.


Comando Siguiente

Utilice este comando para cambiar a la siguiente ventana gráfica abierta según el orden en que se hayan abierto.

Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  En la barra de títulos, haga clic en el botón de Trimble Geomatics Office [image].

  Haga clic con el botón derecho en la barra de títulos.

  En la barra de menús, haga clic en el botón Sistema [image].

Se abre el menú Sistema.

2.	Seleccione Siguiente de este menú.


Comando Anterior

Utilice este comando para cambiar a la ventana gráfica anterior abierta según el orden en que se hayan abierto. Para tener acceso al mismo:

1.	Realice uno de los siguientes pasos:

  En la barra de títulos, haga clic en el botón de Trimble Geomatics Office [image].

  Haga clic con el botón derecho en la barra de títulos.

  En la barra de menús, haga clic en el botón Sistema [image].

Se abre el menú Sistema.

2.	Seleccione Anterior de este menú.


Comando Cambiar a

Utilice este comando para visualizar una lista de todas las aplicaciones abiertas.

Use la opción Lista de tareas para cerrar o cambiar a una aplicación de la lista.

Opciones de diálogo

Cuando seleccione el comando Cambiar a, se abre un diálogo con las siguientes opciones:

Opción	Descripción
Lista de tareas	Selecciona la aplicación a la que quiere cambiar o la que quiere cerrar.
Cambiar a	Activa la aplicación deseada.
Terminar tarea	Cierra la aplicación seleccionada.
Cancelar	Cierra la opción Lista de tareas.
Cascada	Organiza las aplicaciones abiertas de forma que se superpongan las ventanas correspondientes y puedan verse todas las barras de títulos. Esta opción no afecta a las aplicaciones que se han reducido a iconos.
Mosaico	Organiza las aplicaciones abiertas en ventanas que no se superponen. Esta opción no afecta a las aplicaciones que se han reducido a iconos
Organizar iconos	Organiza los iconos de todas las aplicaciones minimizadas en la parte inferior de la pantalla.


Arrastre y colocación de archivos en Trimble Geomatics Office

Visión de conjunto y más información	Cómo ...

Use la función ‘arrastrar y colocar’ del Explorador de Microsoft Windows para importar archivos de datos de una carpeta de su computadora a un proyecto de Trimble Geomatics Office.

Usted puede importar cualquier tipo de archivo que esté disponible en las fichas del diálogo Importar.

NOTA: No se pueden arrastrar y colocar archivos del trabajo (.job) o archivos brutos (.raw) de una tarjeta de PC a un proyecto de Trimble Geomatics Office. Para transferir estos archivos a un proyecto de Trimble Geomatics Office, use este software para transferir los archivos. El software convierte los archivos al formato correcto.

Formatos sencillos

Para arrastrar y colocar archivos puede utilizar cualquiera de los botones del ratón.

Siempre es más seguro usar el botón derecho del ratón ya que cuando suelte:

 el botón derecho del ratón después de arrastrar, aparece una lista de formatos para importar disponibles. Puede seleccionar el formato correcto de la lista.

 el botón izquierdo del ratón después de arrastrar, Trimble Geomatics Office utiliza la extensión del archivo y determina el formato de archivo que está importando. No se garantiza que el software elija el formato de archivo correcto.

Formatos múltiples

Para arrastrar y colocar archivos múltiples puede utilizar cualquiera de los botones del ratón.

  Con el botón derecho del ratón, usted puede arrastrar y colocar archivos múltiples del mismo tipo. Aparece una lista de formatos disponibles de la que puede seleccionar el formato para importar correcto. Si arrastra y coloca una selección de tipos de archivo diferentes (por ejemplo un archivo .dc y uno .dat), las opciones de importación individuales no aparecen en la lista. Seleccione Por defecto de la lista para utilizar las opciones de importación para cada tipo de archivo. Trimble Geomatics usa la extensión de los archivos y determina los formatos de archivo que está importando. Sin embargo, no se garantiza que el software elija el formato de archivo correcto.

  Con el botón izquierdo del ratón, usted puede arrastrar y colocar archivos múltiples de tipos diferentes. Trimble Geomatics Office utiliza la extensión de los archivos y determina el formato de los archivos que está importando. Sin embargo, no se garantiza que el software elija el formato de archivo correcto.

NOTA: Si Trimble Geomatics Office no reconoce ninguno de los formatos importados con arrastrar y colocar, se muestra un menú de acceso directo que le ofrece la opción de importar el archivo como un archivo de Otro colector de datos o como un archivo NMEA. Si elige la opción Por defecto, Trimble Geomatics Office intentará importarlo como un archivo NMEA.

Formatos personalizados

Todos los formatos para importar personalizados que usted cree aparecen en el menú de acceso directo cuando se utilice el botón derecho del ratón para arrastrar y colocar un archivo en un proyecto de Trimble Geomatics Office.

SUGERENCIA: Si no hay ningún proyecto abierto, puede arrastrar el archivo Opciones.ini de un proyecto a Trimble Geomatics Office para abrir el proyecto.


Menús de acceso directo

Los menús de acceso directo son sensibles al contexto y varían en función del lugar donde se coloque el puntero.

Los menús de acceso directo pueden utilizarse para tareas comunes:

  acceso a comandos de menú y diálogos utilizados con frecuencia

  conmutación entre configuraciones de visualización

  inserción de códigos de campo

Para acceder a un menú de acceso directo:

1.	Ubique el puntero en la zona apropiada.

2.	Haga clic en el botón derecho del ratón.


Teclas interactivas

Estas teclas proporcionan un método abreviado del teclado para seleccionar una opción de un diálogo. Se muestran con letras subrayadas en la descripción de la opción.

Presione la tecla que corresponda a la letra subrayada de la opción que quiere seleccionar.


Sistemas de coordenadas - Visión de conjunto

Más información

Cómo ...	Diálogo	Véase también

Visión de conjunto

Trimble Geomatics Office usa un sistema de coordenadas para transformar mediciones de una superficie curva (la Tierra) a una superficie plana (un mapa o plano). Por ejemplo, se usa un sistema de coordenadas para calcular las coordenadas de la cuadrícula para un punto medido usando el GPS (las medidas GPS se realizan sobre el elipsoide WGS-84).

Un sistema de coordenadas puede consistir en los siguientes elementos:

  una transformación de datum (entre el elipsoide WGS-84 y el elipsoide local)

  una proyección

  un modelo geoidal

  una calibración local GPS (consiste en un ajuste horizontal y un ajuste vertical)

Se debe seleccionar un sistema de coordenadas para cada proyecto. Alternativamente, si no tiene un sistema (o no sabe qué sistema seleccionar) use la proyección por defecto.

NOTA: Asegúrese de que los puntos en un  proyecto estén dentro de una distancia razonable del origen de la proyección de acuerdo con las propiedades de la proyección usada.

Base de datos del sistema de coordenadas

La base de datos del sistema de coordenadas está almacenada como un archivo llamado Current.csd. Este contiene toda la información del sistema de coordenadas. Trimble provee un extenso conjunto de sistema de coordenadas publicadas alrededor del mundo. Para definir o editar sistemas de coordenadas, zonas, locales, transformaciones de datum, elipsoides, y modelos geoidales, use la utilidad Administrador de sistemas de coordenadas™ de Trimble™.

Selección de un sistema de coordenadas

Para seleccionar el sistema de coordenadas de un proyecto, use una de las siguientes opciones:

  un sistema de coordenadas y zona de la base de datos del sistema de coordenadas.

  un local de la base de datos del sistema de coordenadas.

   una proyección por defecto no definida.

   una proyección por defecto definida.

 el sistema de coordenadas especificado en un archivo Survey Controller (*.dc) durante la importación.

Cuando seleccione un sistema de coordenadas en el software Trimble Geomatics Office, se obtienen parámetros de la base de datos del sistema de coordenadas.

Cambio del sistema de coordenadas para un proyecto

Para cambiar el sistema de coordenadas para un proyecto, realice una de las siguientes acciones:

  Especifique un nuevo sistema de coordenadas usando el diálogo Propiedades proyecto.

  Importe un archivo Survey Controller (*.dc) con un sistema de coordenadas diferente a un proyecto de Trimble Geomatics Office. Es decir, si el proyecto tiene un sistema de coordenadas y el archivo .dc tiene un sistema de coordenadas diferente, durante la importación el software detecta la diferencia y le solicita que seleccione el que va a usar. Este es un método para cambiar el sistema de coordenadas para un proyecto si elige usar el sistema del archivo .dc.

Cuando cambia el sistema de coordenadas para un proyecto, Trimble Geomatics Office calcula las coordenadas de todos los puntos. Las coordenadas se transforman del sistema de coordenadas antiguo al nuevo sistema de coordenadas. El proceso general para esto es como sigue:

1.	Todas las coordenadas se reducen al elipsoide. (El elipsoide es por lo general el elipsoide WGS-84 pero solamente cuando la proyección ha cambiado es el elipsoide local.)

2.	Se calculan nuevas coordenadas usando nuevos parámetros.

Estos pasos se ilustran en la siguiente figura:

Si un modelo geoidal o ajuste vertical es parte del sistema de coordenadas antiguo, éste utiliza para calcular las alturas WGS-84 para todos los puntos no derivados de las observaciones de campo. De la misma manera, si el modelo geoidal o ajuste vertical se aplica en el nuevo sistema de coordenadas, éste se emplea para calcular la nueva elevación de las coordenadas de la cuadrícula a partir de las alturas WGS-84.

Cómo el cambio del sistema de coordenadas afecta a los softwares Roadlink y Trimble DTMLink

Cuando exporta puntos del proyecto al software Trimble RoadLink™ o Trimble DTMLink™, los puntos que exporta no se actualizan por los cambios posteriores al proyecto de Trimble Geomatics Office.

Trimble recomienda no exportar puntos hasta que esté seguro de que todos los cambios al proyecto de Trimble Geomatics Office estén completos.

Si ya ha exportado puntos del proyecto Trimble Geomatics Office al software Trimble Roadlink o Trimble DTMLink y cambia el sistema de coordenadas o calibra los datos en el proyecto de Trimble Geomatics Office, aparecerá la siguiente advertencia:

Las coordenadas para los puntos en DTMLink y RoadLink no se actualizarán al cambiar el sistema de coordenadas.

Realice una de las siguientes acciones:

  Haga clic en Aceptar para aceptar que las coordenadas del punto no cambiarán en el software Trimble RoadLink o Trimble DTMLink.

  Haga clic en Cancelar para cancelar el cambio.

Para asegurarse de que las últimas coordenadas se utilizan en los software Trimble RoadLink y Trimble DTMLink:

1.	Elimine los puntos no deseados en el software Trimble RoadLink y/o DTMLink.

2.	Exporte nuevamente los puntos del proyecto Trimble Geomatics Office.


Sistemas de coordenadas terrestres

Si usted necesita que las coordenadas estén a nivel de terreno en vez de a nivel de proyección, use un sistema de coordenadas terrestres. Cuando usted selecciona un sistema de coordenadas terrestres las distancias de cuadrícula son iguales a las distancias terrestres.

Para usar sus coordenadas terrestres en el programa de Trimble Geomatics Office usted necesita:

1.	Definir un sistema de coordenadas para el proyecto.

2.	Ingresar coordenadas para la ubicación del proyecto.  La ubicación del proyecto queda guardada como latitud y longitud local.

3.	Ingrese el factor de escala terrestre o calcúlelo usando las coordenadas para la ubicación del proyecto.

Definición de un sistema de coordenadas para el proyecto

Para obtener información acerca de cómo seleccionar y cambiar un sistema de coordenadas en un proyecto de Trimble Geomatics Office, consulte el tema  Sistema de Coordenadas - Visión de conjunto.

Ingresando coordenadas para la ubicación del proyecto

Para ello:

1.	Seleccione Archivo / Propiedades del Proyecto. El cuadro de diálogo Propiedades Proyecto aparece.

2.	Seleccione la ficha Sistema de coordenadas.

3.	En el grupo de configuraciones de ajuste local, haga clic en Cambiar. El cuadro de diálogo de configuración local aparece.

4.	En el grupo de ubicación del Proyecto, ingrese las coordenadas apropiadas. Si el sistema de coordenadas no ha sido definido, se le pedirá actualizar el sistema de coordenadas.

La latitud y la longitud deben ser aproximadas, y la elevación debe ser una estimación razonable de la elevación, por lo tanto ingrese una elevación media para el proyecto.

Factor de Escala Terrrestre

Para ello:

1.	En el cuadro de diálogo de configuración local, seleccione la casilla de Uso de Coordenadas Terrestres y lleve a cabo una de las siguientes acciones:

  Ingrese el Factor de Escala Terrestre.

  Seleccione Calcular Factor de Escala en la casilla de Ubicación del Proyecto. El programa calcula el Factor de Escala Terrestre con los valores del grupo de Ubicación del Proyecto.

  Determine la forma en que las coordenadas terrestres se presentarán. Usted puede especificar un eje Norte y/o Este, o coordenadas de cuatro o cinco dígitos. Use esta opción para distinguir coordenadas en forma expedita

NOTA: El sistema de coordenadas terrestre presupone que usted está trabajando cerca de donde está ubicado el proyecto y que no hay grandes variaciones en la altura de éste.

El Factor de Escala Terrestre se calcula a través de:

1.	La determinación de la elevación de referencia (h)

2.	El cálculo del Factor de Elevación

3. 	Cálculo del Factor de Escala Terrestre en el centroide en la ubicación del proyecto.

Donde:

s es el factor de escala de la cuadrícula en la ubicación del proyecto.

En Trimble Survey Controller versión 10, los sistemas de coordenadas terrestres se soportan totalmente. Las siguientes notas tratan los sistemas de coordenadas terrestres en Trimble Survey Controller versión 7.7 y anteriores.

NOTAS:

Importación de proyectos con coordenadas terrestres de Trimble Survey Controller, versiones 7.5 – 7.7.

Si usted desea importar un trabajo de Trimble Survey Controller (versión 7.5 ó 7.7) con una proyección Mercator transversa en la cual un factor de escala terrestre ha sido definido ( por ejemplo: un trabajo con una calibración pero sin proyección / sin datum) entonces deje en blanco la casilla de Uso de Coordenadas Terrestres en el cuadro de diálogo de configuración local. De lo contrario el factor de escala terrestre será aplicado dos veces.

Cuando usted trata de importar un trabajo de Trimble Survey Controller con un factor de escala terrestre definido en un proyecto de Trimble Geomatics Office que no tiene definido un sistema de coordenadas terrestres, entonces un mensaje de advertencia le indicará que los sistemas de coordenadas en el trabajo y en el proyecto son diferentes.  Use el sistema de coordenadas del proyecto de Trimble Geomatics Office y luego seleccione la casilla de verificación de Uso de coordenadas terrestres en el cuadro de diálogo de configuración local.

Exportar proyectos con coordenadas terrestres a Trimble Survey Controller,  versiones 7.5 – 7.7

Si usted exporta un proyecto de Trimble Geomatics Office con un sistema de coordenadas terrestres definido a Trimble Survey Controller (versión 7.7 ó anterior), el sistema de coordenadas será diferente cuando usted lo vuelva a importar al programa Trimble Geomatics Office. Asegúrese en aceptar el sistema de coordenadas de Trimble Geomatics Office .

Trimble Survey Controller (versión 7.7 ó anterior) no acepta coordenadas terrestres con la proyección cónica conforme de Lambert de 2 paralelos. El sistema de coordenadas se exporta de Trimble Geomatics Office a Trimble Survey Controller con una proyección Cónica Conforme de Lambert de &1 paralelo.

Trimble Survey Controller (versión 7.7 ó anterior) no acepta coordenadas terrestres con una proyección cónica equiareal de Albers. Si usted desea exportar un proyecto con una proyección cónica equiareal de Albers definida en el software Trimble Survey Controller, quite las coordenadas terrestres o cambie las proyecciones.


Transformaciones de datum - Visión de conjunto
Transformaciones de datum − Visión de conjunto

Más información

 Véase también

Visión de conjunto

Una transformación de datum es un conjunto de parámetros que se utiliza para convertir coordenadas de un elipsoide (por ejemplo, el elipsoide WGS-84) a coordenadas en el elipsoide local. (El elipsoide local es el elipsoide usado por la proyección.) Una transformación de datum es parte de la definición del sistema de coordenadas.

Los siguientes métodos de transformación de datum están disponibles:

  Molodensky (tres parámetros)

  siete parámetros

  cuadrícula del datum

  regresión múltiple

Todos los métodos están almacenados en la base de datos del sistema de coordenadas.

Para definir nuevas transformaciones de datum, edite la base de datos del sistema de coordenadas usando la utilidad Administrador del sistema de coordenadas™ de Trimble.


Transformación de datum  - Molodensky (tres parámetros)
Transformación de datum  − Molodensky (tres parámetros)

 Visión de conjunto y más información

La transformación de datum Molodensky define una traslación en las direcciones X,Y, y Z entre el origen del elipsoide WGS-84 y el origen del elipsoide local (o viceversa).

La transformación de datum Molodensky a veces se denomina transformación de datum de tres parámetros.

Visualización de detalles

Si tiene una transformación de datum Molodensky definida como parte del sistema de coordenadas del proyecto, puede visualizar los valores de transformación de datum.

Para hacerlo, use el diálogo Detalles del sistema de coordenadas.

Estos campos definen una transformación tridimensional Cartesiana (X,Y,Z) desde el origen del elipsoide WGS-84 al origen del elipsoide local.

Las transformaciones de datum están almacenadas en la base de datos del sistema de coordenadas (Current.csd). Para editarlas, use la utilidad Administrador de sistemas de coordenadas™ de Trimble.


Transformación de datum - Siete parámetros
Transformación de datum − Siete parámetros

 Visión de conjunto y más información

La transformación de datum de siete parámetros define una transformación del elipsoide WGS-84 a un elipsoide local, o de un elipsoide local al elipsoide WGS-84.

Traslación

Estos campos definen una transformación tridimensional Cartesiana (X,Y,Z) del origen del elipsoide WGS-84 al origen del elipsoide local.

Rotación

Los valores de rotación X definen los ángulos de rotación alrededor de los ejes X, Y, y Z respectivamente. Estos son ángulos por los cuales deben rotarse los ejes Cartesianos del elipsoide WGS-84 para alinearlos con los ejes del elipsoide local.

El ángulo de rotación es positivo para una rotación en el sentido contrario a los punteros del reloj alrededor de cada eje, visto desde el extremo positivo del eje.

Factor de escala

Todas las coordenadas se multiplican por este valor. Esto se define en partes por millón. Si el factor de escala es de 6.02, todas las coordenadas se multiplican por 1.00000602.

Visualización de detalles

Si tiene una transformación de datum de siete parámetros definida como parte del sistema de coordenadas del su proyecto, puede visualizar los valores de transformación de datum.

Para hacerlo, use el diálogo Detalles del Sistema de Coordenadas − ficha Transformación de Datum .

Las transformaciones de datum están almacenadas en la base de datos del sistema de coordenadas  (Current.csd). Para editarlas, use la utilidad Administrador de sistemas de coordenadas™ de Trimble.


Transformación de datum - Cuadrícula del datum
Transformación de datum − Cuadrícula del datum

 Visión de conjunto y más información

Una transformación de datum de la cuadrícula del datum es un archivo publicado que contiene valores para los parámetros de transformación de datum para el área. El archivo se utiliza para interpolar valores de transformación de datum en su posición.

Para usar una cuadrícula del datum como parte de la definición del sistema de coordenadas del proyecto, se debe seleccionar una transformación de datum que se define por un archivo de la cuadrícula del datum (*.dgf) de latitud y longitud.

Para ver o crear una transformación de datum usando los archivos de Cuadrícula del Datum, use la utilidad Administrador de sistema de coordenadas™ de Trimble.

Para usar el archivo de la cuadrícula del datum en el campo, tendrá que transferirlo como un archivo de la cuadrícula del datum combinado a Trimble Survey Controller (versión 7.00 ó posterior).


Transformación de datum - Regresión múltiple
Transformación de datum − Regresión múltiple

 Visión de conjunto y más información

Una transformación de datum de regresión múltiple define una transformación entre el elipsoide WGS-84 y un elipsoide local colocando una ecuación de polinomio en los desplazamientos previstos en el área local. Para añadir una transformación de datum de regresión múltiple, use la utilidad Administrador de sistemas de coordenadas™ de Trimble.

Visualización de detalles

Si tiene una transformación de datum de regresión múltiple definida como parte del sistema de coordenadas del proyecto, puede visualizar los valores de transformación de datum.

Para hacerlo, use el diálogo Detalles del sistema de coordenadas − ficha Transformación de datum .

Las transformaciones de datum están almacenadas en la base de datos del sistema de coordenadas (Current.csd). Para editarlas, use la utilidad Administrador de sistemas de coordenadas™ de Trimble.


Proyecciones - Visión de conjunto
Proyecciones − Visión de conjunto

Más información

 Véase también

Visión de conjunto

Una proyección es una expresión matemática para la superficie curva de un elipsoide en una cuadrícula de coordenadas rectangulares.

Use una proyección para transformar coordenadas geodésicas locales a coordenadas de cuadrícula locales.

Las coordenadas de la cuadrícula se dibujan para crear mapas que representan la superficie de la Tierra o partes de esta superficie.

Diferentes países y regiones usan distintas proyecciones para obtener una distorsión mínima en las coordenadas de cuadrícula resultantes. La utilidad Administrador de sistemas de coordenadas™ de Trimble contiene un gran número de proyecciones (por ejemplo, Mercator transversa y Lambert de un paralelo). Para más información sobre proyecciones específicas, consulte la Ayuda de la utilidad Administrador de sistemas de coordenadas™ de Trimble.

NOTA: Asegúrese de que los puntos en un proyecto estén dentro de una distancia razonable del origen de la proyección de acuerdo con las propiedades de la proyección utilizada.

Para definir parámetros de proyección como parte de la definición de un sistema de coordenadas, use la Administrador de sistemas de coordenadas™  de Trimble.


Modelos geoidales - Visión de conjunto
Modelos geoidales − Visión de conjunto

Más información

 Véase también

Visión de conjunto

Un geoide es una superficie de potencial gravitacional constante que se aproxima al nivel del mar.

Los puntos observados con el GPS tienen alturas basadas en el elipsoide WGS-84. Estas alturas se conocen como alturas del elipsoide.

Un modelo geoidal nos permite estimar elevaciones basadas en las alturas del elipsoide.

Los modelos geoidales están almacenados como archivos de la cuadrícula del geoide (*.ggf). Un archivo .ggf contiene separaciones geoidales para varias posiciones en una cuadrícula. Con el uso de la interpolación, estas separaciones geoidales pueden calcularse para todo punto que esté dentro de la cuadrícula.

Cuando se selecciona un modelo geoidal para cada punto observado usando el GPS, Trimble Geomatics Office usa el archivo .ggf para interpolar la separación geoidal (N) en esa ubicación. Luego resta o suma el valor de la altura del elipsoide observado (a). Esto da una elevación sobre el nivel del mar aproximada (e) para el punto GPS. La relación entre el geoide y el elipsoide local se muestra en la siguiente figura:

Para definir un nuevo modelo geoidal usando un archivo de la cuadrícula del geoide existente use la utilidad Administrador de sistemas de coordenadas™ de Trimble. Todos los modelos geoidales en la base de datos del sistema de coordenadas están disponibles al seleccionar un sistema de coordenadas para un proyecto.

Se puede usar Trimble Geomatics Office para exportar archivos de la cuadrícula del geoide a Trimble Survey Controller o al software TDS Survey Pro CE (versión 3.5 ó posterior), y crear subcuadrículas de archivos de la cuadrícula del geoide existentes.

NOTA: Si no usa un modelo geoidal o realiza una calibración local GPS, la elevación de un punto será la misma que la altura del elipsoide y no será una elevación verdadera. Si se emplea un modelo geoidal en el sistema de coordenadas del proyecto, entonces se lo utilizará para convertir entre alturas del elipsoide locales y elevaciones para todo tipo de puntos, no solamente GPS.


Cambiar Sistema de Coordenadas - Diálogo Seleccionar Sistema de Coordenadas
Cambiar Sistema de Coordenadas  − Diálogo Seleccionar Sistema de Coordenadas

Use este diálogo para seleccionar un sistema de coordenadas, local existente o para definir una proyección por defecto para el proyecto.

Este diálogo es el primer paso de un asistente que lo guía a través de las configuraciones de selección.

Haga clic en Siguiente para avanzar y Atrás para regresar a través de los diálogos de selección.

Trimble Geomatics Office usa sistemas de coordenadas en el archivo de la base de datos del sistema de coordenadas (Current.csd). Se pueden editar los parámetros de un sistema de coordenadas usando la utilidad Administrador de sistemas de coordenadas™ de Trimble.

Nuevo sistema

Para seleccionar un nuevo sistema de coordenadas y zona, un local calibrado que se ha guardado en la base de datos del sistema de coordenadas, o una proyección por defecto:

1.	Seleccione Nuevo Sistema.

2.	Haga clic en Siguiente para ir al Diálogo Seleccionar tipo de sistema de coordenadas.

3.	Use el asistente para seleccionar un sistema de coordenadas para el proyecto.

Sistema recientemente usado

Para seleccionar un sistema de coordenadas de una lista de los diez sistemas de coordenadas escogidos recientemente:

1.	Haga clic en Sistema recientemente usado.

2.	Haga clic en los botones de flecha para desplazarse a través de los resúmenes de los sistemas.

3.	Seleccione el sistema de coordenadas que quiere usar para su proyecto.

4. 	Haga clic en Terminar.

NOTA: Si ésta es la primera vez que ha usado la base de datos del sistema de coordenadas, aparecerá el diálogo Seleccionar tipo de sistema de coordenadas (y no el diálogo Cambiar sistema de coordenadas - Seleccionar sistema de coordenadas). Esto es porque no hay sistemas recientemente usados para seleccionar.

NOTA: Trimble Geomatics Office no acepta todos los sistemas de coordenadas disponibles en el programa de utilidad Coordinate System Manager. Si usted selecciona un sistema de coordenadas que no está definido dentro del programa, el siguiente mensaje aparece:

Tipo de Sistema de Coordenadas Desconocido


Diálogo Seleccionar tipo de sistema de coordenadas

Use este diálogo para seleccionar el tipo de sistema de coordenadas que desea usar.

Sistema de coordenadas y zona

Seleccione esta opción para escoger el sistema de coordenadas de la base de datos del sistema de coordenadas.

Local calibrado

Seleccione esta opción para escoger un local calibrado que haya sido previamente guardado en la base de datos del sistema de coordenadas. Los locales son detalles de los sistemas de coordenadas guardados para locales que pueden incluir parámetros de calibración GPS.

Proyección por defecto (Mercator transversa)

Seleccione esta opción para definir una proyección por defecto.

Atrás

Haga clic en Atrás para regresar al diálogo Seleccionar sistema de coordenadas.

NOTA: Si ésta es la primera vez que ha usado la base de datos del sistema de coordenadas, Atrás no está disponible porque no hay sistemas recientemente usados para seleccionar.

Siguiente

Haga clic en Siguiente. Dependiendo en la opción que ha seleccionado, aparecerá uno de los siguientes diálogos:

  diálogo Seleccionar zona del sistema de coordenadas.

  diálogo Seleccionar local calibrado.

  Diálogo Proyección por defecto (Mercator transversa).


Diálogo Seleccionar zona del sistema de coordenadas

Use este diálogo para seleccionar el sistema de coordenadas para el proyecto de la lista de sistemas de coordenadas disponibles en la base de datos del sistema de coordenadas.

Para ver las propiedades de un grupo de sistema de coordenadas o zona:

1.	Resalte el grupo de sistema de coordenadas o zona.

2.	Haga clic con el botón derecho para acceder al menú abreviado y seleccione Propiedades.

Grupo Sistema de coordenadas

Esta lista contiene los sistemas de coordenadas en la base de datos del sistema de coordenadas. Un sistema contiene una o más zonas que se han definido para diferentes áreas.

Zona

Esta lista contiene las zonas disponibles para el sistema de coordenadas seleccionado. Una zona contiene una transformación de datum (incluyendo un elipsoide y un conjunto de parámetros de transformación para transformar los datos del elipsoide WGS-84 al elipsoide local), modelo geoidal, y parámetros de proyección.

Atrás

Haga clic en Atrás para volver al diálogo Seleccionar tipo de sistema de coordenadas.

Siguiente

Haga clic en Siguiente. Aparecerá el diálogo Seleccionar modelo geoidal.


Diálogo Seleccionar local calibrado

Use este diálogo para seleccionar un local calibrado de la lista de locales calibrados disponibles en la base de datos del sistema de coordenadas. Los locales se guardan en la base de datos del sistema de coordenadas. Puede crear locales en la utilidad Coordinate System Manager, o en Trimble Geomatics Office (en Archivo/ Propiedades del proyecto/ ficha de Sistema de Coordenadas o Levantamiento / Calibración local GPS)

Para ver las propiedades de un ajuste local:

1.	Resalte el nombre del local.

2.	Haga clic con el botón derecho para acceder al menú abreviado y seleccione Propiedades.

Detalles del local

Este grupo muestra la transformación de datum y el modelo geoidal para el local resaltado.

Atrás

Haga clic en Atrás para volver al diálogo Seleccionar tipo de sistema de coordenadas.

Terminar

Haga clic en Terminar para completar la definición del sistema de coordenadas y volver al diálogo Propiedades proyecto. La definición del local seleccionada es el sistema de coordenadas para el proyecto.

NOTA: No puede cambiar el modelo geoidal por un local en el software Trimble Geomatics Office. Se utiliza el modelo geoidal especificado para el local. Para cambiar el modelo geoidal por un local use la utilidad Administrador de sistemas de coordenadas de Trimble. La utilidad le permite editar el ajuste local.


Diálogo Proyección por defecto (Mercator Transversa)

Use este diálogo para especificar los parámetros de la proyección por defecto. Trimble Geomatics Office puede calcular los valores o los puede teclear.

Calcular parámetros de proyección automáticamente

Seleccione esta casilla de verificación para configurar Trimble Geomatics Office para que use automáticamente la primera posición WGS-84 introducida en el proyecto como el origen y la primera coordenada de la cuadrícula (norte y este) para calcular el falso Norte y falso Este.

NOTA: También debe especificar el sistema de acimut Sur (si se requiere) y dirección de coordenada positiva. Trimble Geomatics Office no actualiza automáticamente estos campos.

Inhabilite esta casilla de verificación para introducir los parámetros de proyección. Los siguientes campos en el diálogo estarán disponibles. Introduzca los valores en estos campos.

Latitud central

Introduzca la latitud del origen de la proyección.

Longitud central

Introduzca la longitud del origen de la proyección.

Falso Norte y Falso Este

Introduzca el falso Este y el falso Norte para la proyección por defecto. El falso Este y falso Norte son las coordenadas de la cuadrícula del origen de la proyección por defecto.

Factor de escala

Introduzca el factor de escala para el origen. Este debe estar basado en un factor de escala conocido para la proyección. Esto representa la razón de la distancia sobre la proyección a la distancia sobre la superficie de la Tierra. La escala de todas las coordenadas terrestres será por este valor para dar distancias de cuadrícula.

Sistema de acimut sur

Seleccione este campo para especificar un sistema de acimut sur. Un sistema de acimut sur usa el Sur como acimut de cero grados. Se lo utiliza en Hawaii y Sudáfrica (otros sistemas usan el Norte como acimut de cero grados).

Dirección de coordenadas positivas

Seleccione las opciones para especificar la dirección en la cual quiere que se incrementen los valores de las coordenadas.

Atrás

Haga clic en Atrás para volver al diálogo Seleccionar tipo de sistema  de coordenadas.

Siguiente

Cuando haya terminado, haga clic en Siguiente. Aparecerá el diálogo Seleccionar modelo geoidal.


Diálogo Seleccionar modelo geoidal

Use este diálogo para seleccionar un modelo geoidal para el proyecto. Si se define un modelo geoidal para el sistema de coordenadas en la base de datos del sistema de coordenadas, el modelo geoidal se seleccionará automáticamente.

Un modelo geoidal es una superficie matemática compuesta de las separaciones geoide/elipsoide. Es una estimación de la separación entre el elipsoide WGS-84 y el nivel medio del mar. Un modelo geoidal se utiliza para derivar alturas ortométricas aproximadas para puntos GPS.

Sin modelo geoidal

Seleccione esta opción para no especificar un modelo geoidal para el sistema de coordenadas. Si no especifica un modelo geoidal la elevación de un punto será la altura sobre el elipsoide local.

Si selecciona esta opción, Trimble recomienda realizar una calibración local GPS para obtener elevaciones más precisas para sus observaciones GPS.

Modelo geoidal predefinido

Para especificar un modelo geoidal para el proyecto, seleccione uno de la lista. La lista de modelos geoidales es de la base de datos del sistema de coordenadas (Current.csd).

Dependiendo de la precisión del modelo geoidal, se asigna una calidad a la elevación derivada de la altura WGS-84 y la separación geoidal. Para especificar la calidad del modelo geoidal, use el campo Calidad modelo geoidal en el diálogo Propiedades proyecto / ficha Recalcular. La calidad se utiliza para determinar la calidad del campo de elevación para puntos.

Atrás

Haga clic en Atrás para volver al diálogo Seleccionar zona del sistema de coordenadas o al  diálogo Proyección por defecto (Mercator transversa).

Terminar

Haga clic en Terminar para completar la definición del sistema de coordenadas y volver al diálogo de Propiedades proyecto.


Locales - Visión de conjunto

Un local se utiliza por lo general para almacenar detalles de calibración local GPS basados en un sistema de coordenadas existente y zona.

Cuando haya realizado una calibración local GPS puede guardarla en el sistema de coordenadas y la base de datos del sistema de coordenadas como un ajuste local, de manera que pueda usarlo fácilmente nuevamente.

Para guardar un ajuste local, realice una de las siguientes acciones:

  Seleccione Levantamiento / Calibración local GPS.

  Seleccione Archivo / Propiedades proyecto/ ficha Sistema de coordenadas.

Alternativamente, puede crear un nuevo local usando la utilidad Administrador de sistemas de coordenadas™ de Trimble . Cuando use esta utilidad, los locales guardados aparecen en la ficha Locales.

Para más información, vea la Ayuda en la utilidad Administrador de Sistemas de Coordenadas de Trimble.

NOTA: No se pueden guardar parámetros de transformación del ajuste como un local.


Uso de una proyección por defecto no definida - Visión de conjunto / Diálogo Definición de la proyección por defecto
Uso de una proyección por defecto no definida − Visión de conjunto / Diálogo Definición de la proyección por defecto

Visión de conjunto

Una proyección por defecto no definida es una proyección por defecto sin valores de latitud o longitud de origen. Cuando se introducen datos topográficos en el proyecto por primera vez usando una proyección por defecto no definida, aparecerá el diálogo Definición de la proyección por defecto. Dicho diálogo sugiere usar parámetros de proyección que se ajusten a los datos que está introduciendo. Diferentes campos en el diálogo estarán disponibles dependiendo del tipo de datos que se están añadiendo al proyecto. Se pueden dar las siguientes situaciones:

  Añadir puntos GPS a un proyecto (Proyección por defecto no definida) que contiene puntos de la cuadrícula.

  Un archivo con una proyección definida a un proyecto con una Proyección por defecto no definida Proyección

  Añadir un punto WGS-84 a un proyecto (Proyección por defecto no definida).

  Usar archivos de factor de escala solamente (Proyección por defecto no definida).

  Añadir puntos de la cuadrícula a un proyecto vacío.

Para usar una proyección por defecto no definida, use una plantilla de proyecto que no tenga un sistema de coordenadas definido (por ejemplo, las plantillas métrica y Pies USA de Trimble).


Añadir puntos de la cuadrícula (Proyección por defecto no definida)

 Visión de conjunto y más información

El diálogo Definición de la proyección por defecto aparece cuando la primera posición que tiene una proyección no definida por defecto se añade al proyecto Trimble Geomatics Office (no hay sistema de coordenadas) es una posición de la cuadrícula.

El diálogo Definición de la proyección por defecto contiene los siguientes campos:

Falso Norte

El Norte en el origen de la proyección. El valor Norte se deriva del primer punto en el archivo. Se puede cambiar este valor.

Falso Este

El Este en el origen de la proyección. El valor Este se deriva del primer punto en el archivo. Se puede cambiar este valor

Aceptar

Haga clic en Aceptar para aceptar los parámetros de proyección por defecto. Estos valores se usan para definir el sistema de coordenadas para el proyecto. Para visualizar estos parámetros seleccione Archivo / Propiedades proyecto / ficha Sistema de coordenadas y haga clic en Detalles.

NOTA: Debido a que la proyección por defecto todavía no esta totalmente definida (la latitud y longitud origen están sin definir), puede actualizar la proyección por defecto importando un archivo que contiene uno o más puntos GPS.


Añadir puntos GPS a un proyecto (Proyección por defecto no definida) que contiene puntos de la cuadrícula

 Visión de conjunto y más información

El diálogo Definición de la proyección por defecto aparece cuando el proyecto de Trimble Geomatics Office tiene una proyección por defecto no definida (sin latitud o longitud de origen), contiene una o más posiciones de la cuadrícula, y:

  se importa un archivo que contiene por lo menos un punto GPS;

o

 se teclea un punto WGS-84.

El diálogo Definición de la proyección por defecto contiene los siguientes campos:

Norte

Dicho campo es nulo. Introduzca la coordenada Norte mejor conocida como el punto GPS que se está usando para definir la proyección por defecto.

Este

Dicho campo es nulo. Introduzca la coordenada Este mejor conocida como el punto GPS que se está usando para definir la proyección por defecto.

Latitud

Aquí se muestra la latitud WGS-84 del primer punto GPS en el archivo. Dicho campo no estará disponible.

Longitud

Aquí se muestra la longitud WGS-84 del primer punto GPS en el archivo. Dicho campo no estará disponible.

Aceptar

Haga clic en Aceptar para aceptar las coordenadas de la cuadrícula para el punto GPS. Los valores de latitud y longitud WGS-84 para el origen se determinan basados en las coordenadas falsas para el origen (ya definidas), y los valores para el punto GPS especificados en el diálogo. Para ver todos los parámetros seleccione Archivo / Propiedades proyecto / ficha Sistema de coordenadas y haga clic en Detalles.

NOTA: Una vez que un punto GPS ha sido añadido a la base de datos, la proyección por defecto está totalmente definida, a partir de este momento cuando se importe un archivo, o se añada un punto al proyecto de Trimble Geomatics Office, los parámetros de la proyección por defecto no se actualizarán. Sin embargo, se puede actualizar el origen de la proyección realizando una calibración GPS (seleccione Levantamiento/ Calibración local GPS).


Añadir un punto WGS-84 a un proyecto (Proyección por defecto no definida)

El diálogo Definición de la proyección por defecto aparece cuando el proyecto de Trimble Geomatics Office tiene una proyección por defecto no definida (sin latitud o longitud de origen) y

  se introduce un punto WGS-84

 se importa un punto WGS-84.

El diálogo Definición de la proyección por defecto contiene los siguientes campos:

Norte

El valor por defecto de este campo es de 0. Introduzca la coordenada Norte mejor conocida para el punto que se está usando para definir la proyección por defecto. Este valor se utiliza como el falso norte para la proyección.

Este

El valor por defecto de este campo es de 0. Introduzca la coordenada Este mejor conocida para el punto que se está usando para definir la proyección por defecto. Este valor se utiliza como el falso Este para la proyección.

Latitud origen

Aquí se muestra la latitud WGS-84 del punto. Dicho campo es la latitud de origen para la proyección. Este campo no estará disponible.

Longitud origen

Aquí se muestra la latitud WGS-84 del punto. Dicho campo es la longitud de origen para la proyección. Este campo no estará disponible.

Aceptar

Haga clic en Aceptar para aceptar los parámetros de proyección por defecto. Estos valores se usan para definir el sistema de coordenadas para el proyecto. Para ver estos parámetros seleccione Archivo / Propiedades proyecto / ficha Sistema de coordenadas y haga clic en Detalles.

NOTA: Una vez que la proyección por defecto está totalmente definida, a partir de este momento cuando importe un archivo .dc, o añada un punto al proyecto de Trimble Geomatics Office, los parámetros de la proyección por defecto no se actualizarán. Sin embargo, puede actualizar el origen de la proyección realizando una calibración GPS (seleccione Levantamiento / Calibración local GPS).


Importación de un archivo (con una proyección definida) a un proyecto con una proyección por defecto no definida

 Visión de conjunto y más información

El sistema de coordenadas del proyecto cambia automáticamente al sistema de coordenadas especificado en el archivo.

Se escribirá un mensaje en el informe para importar que dice:

Los sistemas de coordenadas importado y del proyecto eran diferentes. La definición importada se ha usado de preferencia a la proyección por defecto no definida (Mercator transversa).


Uso del sistema de coordenadas de un archivo

 Visión de conjunto y más información

Cuando se importa un archivo con un sistema de coordenadas definido, la definición del sistema de coordenadas registrada en el archivo se compara con la definición del sistema de coordenadas para el proyecto. Si son diferentes, aparecerá el diálogo Sistema de coordenadas del proyecto.

Para usar el sistema de coordenadas especificado en el archivo, seleccione la opción Convertir a la definición del colector de datos en el diálogo Sistema de coordenadas del proyecto.

Si el sistema de coordenadas en el archivo no es un sistema de coordenadas de factor de escala solamente, la definición del sistema de coordenadas se cambia a la que está especificada en el archivo.

Si el sistema de coordenadas en el archivo es de Factor de escala solamente, entonces lo que suceda dependerá del sistema de coordenadas definido para el proyecto.

NOTA: Si el sistema de coordenadas del proyecto es una proyección por defecto no definida y no tiene puntos, el sistema de coordenadas en el archivo se utiliza automáticamente y el sistema de coordenadas del proyecto se cambia al del archivo.


Archivos de estación total (factor de escala solamente) sin un sistema de coordenadas definido - Visión de conjunto

Visión de conjunto

Un sistema de coordenadas de factor de escala solamente se puede usar para levantamientos donde todas las observaciones se han realizado con un instrumento convencional (es decir, no hay observaciones GPS).

La manera en que se manejan los archivos que contienen solamente observaciones terrestres en Trimble Geomatics Office depende del sistema de coordenadas definido en el proyecto de Trimble Geomatics Office.

Proyección por defecto no definida.

Si el proyecto de Trimble Geomatics Office tiene una proyección por defecto no definida (sin latitud o longitud de origen), aparecerá el diálogo Proyección por defecto. Podrá introducir los valores Norte, Este y de escala.

ADVERTENCIA: Si un punto ya existe en la base de datos, la escala en el archivo .dc no será usada para actualizar la proyección por defecto. Asegúrese de que la escala en el archivo importado sea igual a la escala en la definición por defecto del proyecto.

Sistema de coordenadas definido

Si el proyecto de Trimble Geomatics Office tiene un sistema de coordenadas definido (incluyendo la proyección por defecto donde se han definido los valores de latitud y longitud de origen), se usará el sistema de coordenadas del proyecto definido y se supone que la escala en el archivo es la misma que la del sistema de coordenadas del proyecto.


Uso de archivos de factor de escala solamente (Proyección por defecto no definida)

 Visión de conjunto y más información

El diálogo Definición de la Proyección por Defecto aparece cuando:

  el archivo que se está importando contiene una proyección de factor de escala solamente

  el proyecto de Trimble Geomatics Office tiene una proyección por defecto no definida (es decir, la latitud y longitud de origen no están definidas)

  no hay puntos en la base de datos

El diálogo contiene los siguientes campos:

Falso Norte

El valor Norte se deriva del primer punto en el archivo. Se podrán cambiar los valores para el origen falso.

Falso Este

El valor Este se deriva del primer punto en el archivo. Se podrán cambiar los valores para el origen falso.

Factor de escala

El factor de escala se deriva del último registro de escala en el archivo. Se podrán cambiar los valores para el factor de escala.

NOTA: Cuando esté buscando el primer punto en el archivo, los puntos eliminados no se tendrán en consideración.

Aceptar

Haga clic en Aceptar para aceptar los parámetros de proyección por defecto. Dichos valores se usan para definir el sistema de coordenadas del proyecto. Para ver estos parámetros seleccione Archivo / Propiedades proyecto / ficha Sistema de coordenadas y haga clic en Detalles.

NOTA: Debido a que la proyección por defecto todavía no está totalmente definida (es decir, la latitud y longitud de origen todavía no están definidas), la proyección por defecto será actualizada cuando se importe un archivo que contiene una o más posiciones GPS.

La corrección de nivel del mar está apagada a menos que usted haya seleccionado la casilla de Uso de coordenadas terrestres en el cuadro de diálogo de configuración local.


Uso de archivos terrestres con el sistema de coordenadas del proyecto definido

Si se define un sistema de coordenadas para el proyecto de Trimble Geomatics Office y se importa un archivo, aparecerá un mensaje que indica que se debe emplear el sistema de coordenadas existente del proyecto. Luego se importan los puntos en el archivo.

Trimble Geomatics Office supone que la escala del proyecto en el sistema de coordenadas existente y el factor de escala terrestres es equivalente a la escala del archivo.

Si la opción de Uso de coordenadas terrestres no está seleccionada en el cuadro de diálogo de Configuraciones de Ajuste Local, debe verificar que las escalas sean idénticas antes de importar y que el factor de escala del archivo sea equivalente al factor de escala combinado.

Si selecciona la casilla de verificación de Uso de coordenadas terrestres en el cuadro de diálogo de configuraciones de ajuste local, verifique que la elevación en Trimble Geomatics sea la correcta para los datos que se están importando.


Diálogo Sistema de coordenadas del proyecto

Este diálogo aparece cuando se importa un archivo y la definición del sistema de coordenadas registrada en el archivo es diferente a la definición del sistema de coordenadas para el proyecto y el sistema de coordenadas del proyecto está definido (es decir, el sistema de coordenadas del proyecto no es una proyección por defecto no definida).

Sistema de coordenadas

Para usar el sistema de coordenadas en el archivo, seleccione Convertir a la definición del colector de datos. Cualquier dato existente en la base de datos es actualizado usando la nueva definición del sistema de coordenadas.

Para retener la definición del sistema de coordenadas del proyecto seleccione la opción Mantener la definición de proyecto actual. Los datos en el archivo del colector de datos se interpretan usando la definición del sistema de coordenadas del proyecto.

Para ver los detalles de uno de los sistemas de coordenadas, haga clic en el botón Detalles correspondiente.

Resumen

Haga clic en Resumen para ver un informe de comparación de los dos sistemas de coordenadas. Utilícelo para inspeccionar los parámetros completos de los sistemas de coordenadas y encontrar las diferencias entre ellos.


Uso del diálogo Sistema de coordenadas del proyecto durante la importación de archivos

Cuando se importa un archivo, la definición del sistema de coordenadas registrada en el archivo se compara con la definición del sistema de coordenadas para el proyecto. Para usar el sistema de coordenadas especificado en el proyecto, seleccione la opción Mantener la definición de proyecto actual en el diálogo Sistema de coordenadas del proyecto.

Proyección por defecto no definida.

Si el sistema de coordenadas del proyecto es una proyección por defecto no definida, aparecerá Actualizar proyección por defecto. El primer punto en el archivo se usa para actualizar la proyección por defecto.

Otros sistemas de coordenadas

El archivo se importa usando el sistema de coordenadas del proyecto.

NOTA: Si el sistema de coordenadas en el archivo es de factor de escala solamente entonces lo que suceda dependerá del sistema de coordenadas definido para el proyecto.


Uso de una proyección plana de Trimble Survey Office o Trimble Survey Controller

Trimble Geomatics Office no actualizará una proyección plana no definida.

Si realiza una de las siguientes acciones:

  exporta un archivo de gráficos de Trimble (*.tgf) de Trimble Survey Office donde el proyecto de Trimble Survey Office tiene una Proyección plana

  exporta un .dc de un proyecto de Trimble Survey Office con una Proyección plana

y luego importa el archivo a Trimble Geomatics Office, la Proyección plana podría todavía utilizarse para el proyecto de Trimble Geomatics Office. (Debe seleccionar la opción Usar el archivo .dc del sistema de coordenadas cuando aparece el diálogo Sistema de coordenadas del proyecto.)

La Proyección plana se convertirá en el sistema de coordenadas seleccionado para el proyecto. Use el Diálogo Propiedades proyecto / ficha Sistema de Coordenadas para ver los detalles del sistema de coordenadas.


Ejecución de un ajuste de la red con datos de un archivo de factor de escala solamente (proyección por defecto no definida)

Un archivo de datos terrestres (es decir, uno sin observaciones GPS), puede tener un sistema de coordenadas que no tiene ningún parámetro definido aparte de la escala; es decir, no tiene una transformación de datum, ni ajuste horizontal o vertical. Los sistemas de coordenadas de tipo factor de escala-solamente son creados en Trimble Survey Controller (versión 7.00 ó posterior).

En el software Trimble Geomatics Office, usted debe definir un sistema de coordenadas antes de llevar a cabo un ajuste de red. Por lo tanto, si ha importado un trabajo de tipo factor de escala-solamente de Trimble Survey Controller a un proyecto de Trimble Geomatics Office con un sistema de coordenadas no definido (por defecto), el software le pide actualizar la proyección no definida por defecto.

En el cuadro de diálogo que aparece, debe ingresar la latitud y longitud para el origen del proyecto junto con las coordenadas de falso Norte y Este.


Parámetros de rotación terrestre

Si se procesan líneas base que sobrepasan los 100 km, el procesador de líneas base utilizará parámetros de rotación terrestre para modelar las mareas de los polos.

Dichos parámetros, en particular las coordenadas polares, están disponibles cada semana como (archivos .erp) en organizaciones tales como el Servicio GPS Internacional (International GPS Service) (IGS). Si no hay un archivo .erp disponible cuando se genera la línea base, se utilizarán las coordenadas polares predichas.

Utilice el Explorador de Windows para copiar todos los archivos .erp correspondientes a la carpeta Archivos de datos\Efemérides precisa en la carpeta del proyecto. El procesador de líneas base automáticamente buscará estos archivos aquí cuando se los necesita. Si no los encuentra, empleará los valores predichos.

NOTA: Si usa un archivo .erp en más de un proyecto, deberá copiarlo en cada uno de los proyectos.


Red Geodésica de Alta Precisión

Los archivos de la cuadrícula de datum HPGN (High Precision Geodetic Network – Red Geodésica de Alta Precisión) para los sistemas del Plano del estado de los Estados Unidos, se proveen como parte de la instalación del sistema Trimble Geomatics Office. Los archivos de la cuadrícula de datum se almacenan en la carpeta GeoData en la carpeta Archivos comunes de Trimble (por lo general, Archivos de programa \Archivos comunes\Trimble\GeoData). Los archivos de la cuadrícula de datum HPGN no están disponibles para todos los estados de los EE.UU..

Las convenciones para la nomenclatura de archivos es la siguiente:

  El identificador de estados de dos caracteres + hpgn + la (latitud) o lo (longitud), con la extensión de archivo .dgf. Por ejemplo, los archivos de cuadrícula HPGN de California son Cahpgnla.dgf y Cahpgnlo.dgf.

Puesto que la administración del sistema de coordenadas de Trimble Geomatics Office se basa en el elipsoide WGS-84, las cuadrículas de datum HPGN (diseñadas para la conversión bidireccional entre NAD83 (1986) y NAD83 (HPGN)) no encajan exactamente en este modelo de sistema de coordenadas. Por esta razón, y para evitar confusiones, el software no provee definiciones predefinidas del sistema de coordenadas para referenciar dichas cuadrículas de datum.

Podrá configurar sus propias definiciones de sistema de coordenadas y de datum utilizando los archivos de cuadrícula de datum HPGN correspondientes en la utilidad Coordinate System Manager (Administrador de sistemas de coordenadas).

Para ello:

1.	Cree una nueva definición de datum que referencie los archivos de cuadrícula de datum HPGN correspondientes para el estado.

2.	Cree una nueva definición de sistema de coordenadas utilizando los parámetros correctos de la proyección del Plano del estado y referenciando la nueva definición de datum creada.

Use la nueva definición de sistema de coordenadas en un proyecto de Trimble Geomatics Office a fin de obtener los valores de latitud y longitud NAD-83 (1986) a partir de coordenadas de la proyección HPGN conocidas, o valores latitud, longitud y altura.

Haga lo siguiente:

1.	Introduzca los valores HPGN como coordenadas de cuadrícula, o los valores de latitud, longitud y altura local según corresponda.

2.	Lea los valores de latitud y longitud NAD-83 (1986) equivalente en los campos WGS-84 que se presentan.

Obtenga los valores HPGN a partir de valores de latitud, longitud y altura NAD-83 (1986) conocidos, de la siguiente forma:

1.	Introduzca los valores de latitud, longitud y altura NAD-83 (1986) conocidos como valores WGS-84.

2.	Lea las coordenadas de cuadrícula HPGN equivalentes; o los valores de altitud, longitud y altura en la cuadrícula o campos locales respectivamente.


Sistema de coordenadas New Brunswick (Canadá)

La base de datos del sistema de coordenadas ahora tiene la proyección Estereográfica Doble y el elipsoide del Sistema terrestre medio (Average Terrestrial System ) de 1977 (ATS77). Deberá adquirir la cuadrícula de datum y el modelo geoidal de Geodetic Survey of Canada antes de instalar el sistema de coordenadas New Brunswick.

El sistema de coordenadas New Brunswick (Canadá) utiliza:

  Elipsoide: ATS77

  Datum: Cuadrícula de datum NTv2

  Geoide: HT101

  Proyección: Estereográfica Doble:

– Latitud central: 46° 30' 00" N

– Longitud central: 66° 30' 00" O

– Falso norte: 800 000 m

– Falso este: 300 000 m

– Factor de escala: 0.999912

Para crear el sistema de coordenadas New Brunswick (Canadá):

1.	Use la utilidad Grid Factory para crear archivos de la cuadrícula de geoide (*.ggf) a partir del modelo geoidal HT101 adquirido de Geodetic Survey of Canada.

2.	Use la utilidad Grid Factory para crear archivos de la cuadrícula de datum (*lat.dgf, *lon.dgf) a partir de la cuadrícula de datum NTv2 adquirida de Geodetic Survey of Canada. Consulte más información en la ayuda de la utilidad Grid Factory.

3.	Use la utilidad Coordinate System Manager para añadir un nuevo sistema de coordenadas. Para más información, consulte el tema Comando Añadir sistema de coordenadas en la ayuda de la utilidad Coordinate System Manager.


Glosario

Este glosario define los términos específicos del GPS y del software Trimble Geomatics Office. No contiene términos de Microsoft Windows o vocablos generales de computación.

Símbolos

1-sigma

A

AASHTO

achatamiento inverso

achatamiento

acimut de sección normal

acimut geodésico

acimut

ajuste de la red

ajuste de punto de control fijo mínimo

ajuste libre

ajuste local calibrado

ajuste vertical

ajuste

algoritmo

alineación del vertical

almanaque

altura de antena

altura elipsoidal

altura ortométrica

ambigüedad del entero

ambigüedad

ángulo cartográfico

anotación

antiespionaje (AS)

APC

archivo de biblioteca de características y atributos (*.fcl)

B

banda ancha

banda estrecha

baudio

bivariada

búsqueda de enteros

C

calibración local

capas

Centrado en la Tierra-Fijo en la Tierra (ECEF)

centro de fase

cierre

cinemático en tiempo real

CMR

código de adquisición grosera (C/A)

código P

código Y

código

códigos de campo

códigos de característica

componente

constelación

convergencia de ajuste

conversión de cuadrícula

coordenadas cartesianas

coordenadas de calibración

coordenadas de plano de estado

coordenadas fijas

coordenadas geodésicas locales

coordenadas geográficas

coordenadas rectangulares

corrección de fase de antena

corrección tropo

correlativas

covarianza

criterio tau

cuadrícula

curva de distribución normal

D

datos brutos GPS

datum de ajuste

datum del proyecto

datum geodésico

datum

defecto datum

desajuste horario

desconocidos

desplazamiento de la vertical

dibujo del cielo

diferenciación doble

disponibilidad selectiva (S/A)

distancia de cuadrícula

distancia del terreno

distancia elipsoidal

distancia horizontal

distancia inclinada

distribución de frecuencia

doble frecuencia

DOP

DTM

E

efecto Doppler

efemérides precisa

efemérides

eje mayor

eje menor

elevación

eliminar

elipse de error

elipsoide local

elipsoide

entidades

época

error de instalación

error propagado

error típico de ponderación unitaria

error típico

Errores a posteriori

Errores a priori

errores de centrado de la plataforma nivelante

errores relativos

errores sistemáticos

error

escala

escalar

estación base

estación de referencia

estado de la red

estado

estático (levantamiento)

estático rápido

estilos CAD

estilos de ajuste

estimación del componente de la varianza

estrategia de ponderación

etiqueta

eventos

F

factor de referencia

fijo

frecuencia única

G

GDOP

geoide

geomática

geometría del satélite

GPS

grados de libertad

grupo de componente de varianza

grupo de parámetros de transformación

H

HDOP

HI

histograma

hora GPS

horizonte geodésico local

I

incremento de altura

incremento de elevación

incremento N, incremento E, incremento U

incremento X, incremento Y, incremento Z

independiente

inicialización de punto conocido

intervalo de época

ionosfera

modelo ionosférico

iteración

J

K

L

L1

L2

levantamiento cinemático

libre de ionosfera

limitado (o restringido)

límite PDOP

línea base GPS

línea base

líneas base redundantes

M

marco de referencia

máscara de elevación

máscara PDOP

matriz covarianza-varianza

matriz de covarianza

mensaje de datos

meridiano rotado

método de búsqueda OTF

mínimos cuadrados

modelado

modelo estocástico

modelo geoidal

modelo tropo

modelos de centro de fase

módulo de cierre

móvil

N

NAVDATA

nivel de fiabilidad

nivel de significación

nivel medio del mar

NMEA

normal

número de redundancia

O

observación convencional

observación geoidal

observación redundante

observación terrestre

observaciones GPS

observaciones topográficas

observaciones

origen

P

parámetro

parámetros de transformación

paridad

PDOP

perfil de columna reducido

periférico

pie topográfico USA

plataforma nivelante

ponderación escalar

ponderaciones

ponderación

posición horizontal

posicionamiento autónomo

posicionamiento diferencial

posiciones de punto

posprocesamiento

PPM

precisión

precisión

PRN

probabilidad

procesador de líneas base

proyección cartográfica

proyección

proyecto

prueba chi-cuadrado

prueba de aceptación de calidad

punto de control fijo interior

punto de control fijo

punto de control horizontal

punto de control vertical

punto de control

Q

R

rastreo

razón

RDOP

red estática

red secundaria

red

redundancia

registro de datos

registros QC

residual de observación

residual

retraso del cenit

RINEX

RMS

rotación

RTCM

RTK

S

salto de ciclo

SDMS

semieje mayor

semieje menor

separación geoidal

sesión

sigma

signo algebraico

símbolos y tipos de línea

sistema de coordenadas

SNR

sobredeterminado

solución fija

solución final

solución flotante

super-trak

SV

T

tau (valor)

TDOP

tiempo de ocupación

tipos de solución

toma aislada

totalmente limitado (o restringido)

TOW

transformación de datum

transformación

trayectoria múltiple

U

univariada

URA

US National

UTC

V

valor este

valor norte

valor probable

valores ajustados

valores de covarianza

varianza de referencia

varianza

varilla de medición

VDOP

vector

vertical

vista actual

W

WAVE

WGS-84

X

X, Y, y Z

Y

Z


1-sigma

Un error típico de la media.


errores a posteriori

Los errores a priori multiplicados por la ponderación de unidad de error típico (factor de referencia) que resulta de un ajuste de red.


Error a priori

Errores estimados de las observaciones antes del ajuste de red.


AASHTO

American Association of State Highway and Transportation Officials (Asociación americana de oficiales de transporte y autopistas estatales)


precisión

La proximidad de una medida al valor real (verdadero) de la cantidad que se está midiendo.


valores ajustados

Un valor derivado de los datos observados (medición) que resulta de aplicar un proceso de eliminación de errores en los datos de un ajuste de red.


ajuste

El proceso de determinar y aplicar correcciones a observaciones con el fin de reducir errores en un ajuste de red.


convergencia del ajuste

Cuando un ajuste de red ha cumplido con la tolerancia residual definida o la última tolerancia residual en varias iteraciones.


Datum de ajuste

El datum utilizado en la iteración de ajuste de red. El software Trimble Geomatics Office le permite seleccionar el datum del proyecto o el datum WGS-84.


Estilos de ajuste

El valor por defecto de Trimble y las configuraciones definidas por el usuario para un ajuste de red.


signo algebraico

El signo (+ ó -) asociado con el valor que lo designa como un número negativo o positivo.


algoritmo

Un conjunto de reglas para la resolución de un problema en un número de pasos finito.


almanaque

Datos, transmitidos por un satélite GPS, que incluyen información de la órbita de todos los satélites, correcciones horarias, y parámetros de retraso atmosférico.

El almanaque facilita la adquisición rápida de SV. La información de órbita es un subconjunto de los datos de efemérides con precisión reducida.


ambigüedad

El número entero de ciclos desconocido, de la fase portadora reconstruida, contenido en un conjunto de medidas continuas. El receptor cuenta las ondas de radio (entre el satélite y la antena) con un nivel de precisión alto. No obstante, el receptor no tiene información del número de ondas que se envían al satélite en el momento en que empezó a contar. Este número de longitudes de onda desconocido entre el satélite y la antena, es la ambigüedad. También se conoce como desviación del entero.


anotación

Texto que describe otro registro de base de datos. Para seleccionar y editar anotaciones, utilice la ventana Propiedades.

La anotación es ‘animada’—cuando la entidad principal cambia los campos se amplían.


altura de antena

La altura del centro de fase de la antena GPS sobre el punto que está siendo observado.

La altura de antena sin corregir se mide desde el punto observado a un punto designado de la antena, y a continuación se corrige al valor verdadero vertical manualmente o automáticamente en el software.


corrección de fase de antena

El centro de fase de una antena GPS no es un punto físico o estable.  Este centro cambia en función de la dirección de la señal de un satélite. Gran parte de esta variación depende de la elevación del satélite. Al modelar esta variación del centro de fase de la antena, se permite el empleo de diversos tipos de antena en un único levantamiento. Las correcciones de centro de fase de antena, no son tan críticas cuando se usan dos antenas iguales, ya que se cancelan los errores idénticos que compartan.


Antiespionaje (AS)

Una característica que permite que el Departamento de Defensa estadounidense pueda transmitir códigos Y en lugar de códigos P. La finalidad del código Y es que sólo pueda ser utilizado por usuarios autorizados (principalmente militares). El antiespionaje se utiliza junto con la disponibilidad selectiva para no permitir que los usuarios civiles tengan acceso total al GPS.


APC

Antenna Phase Center (Centro de fase de la antena)

El centro electrónico de la antena. Generalmente no corresponde al centro físico de la antena. La señal de radio se mide en el APC.

En la ventana Propiedades la altura de un punto puede ser la elevación del APC. Si la altura se especifica como APC, se refiere a la altura APC—no a la altura del terreno.


posicionamiento autónomo

Una modalidad de funcionamiento en la que un receptor GPS calcula fijos de posición en tiempo real únicamente a partir de información del satélite, y sin referencia a datos suministrados por una estación base. El posicionamiento autónomo es el menos preciso que puede realizar un receptor GPS, originando fijos de posición con una precisión de ±100 metros horizontal RMS cuando la disponibilidad selectiva está actuando, y de ±10--20 metros cuando está inhabilitada. También se conoce como posicionamiento absoluto y posicionamiento de un punto.


acimut

Una observación topográfica utilizada para medir el ángulo formado entre una línea base horizontal y el norte geodésico. Cuando se aplica a observaciones GPS, se refiere a un acimut de sección normal.


estación base

Una antena y un receptor instalados en una posición conocida. Se utiliza para levantamientos cinemáticos en tiempo real (RTK), o levantamientos diferenciales. La estación base puede registrar datos para un posprocesamiento posterior. Ejemplos de estación base son las estaciones de referencia de Trimble, como el software Trimble Reference Station (TRS), o el software Trimble Universal Reference Station (URS) y un receptor en modalidad de estación base.

En la práctica con GPS, el topógrafo observa y calcula líneas base (es decir, la posición de un receptor relativa a otro). La estación base actúa como la posición a partir de la cual se derivan todas las otras posiciones.


línea base

La posición de un punto relativa a otro punto. En topografía GPS, es la posición de un receptor relativa a otro. Cuando se combinan los datos de estos dos receptores, se obtiene una línea base constituida por un vector dimensional entre las dos estaciones.


procesador de líneas base

Un programa de informática que combina soluciones de línea base a partir de medidas de satélites. Puede ejecutarse como un posprocesador en una computadora personal, o como un procesador en tiempo real en un receptor. El procesador de líneas base de Trimble se llama WAVE (Weighted Ambiguity Vector Estimator), un estimador de vectores de ambigüedad ponderada.


baudio

Una unidad de velocidad de transferencia de datos (de un dispositivo digital binario a otro), utilizada cuando se describen comunicaciones en serie.


bivariada

Función matemática que describe el comportamiento de errores bidimensionales aleatorios en elipses de error para:

  norte/este

  latitud/longitud

  X/Y


estilos CAD

los estilos CAD definen la apariencia de puntos, líneas, arcos, curvas, texto y anotaciones en un proyecto. Un estilo, por ejemplo, puede estar formado por un símbolo, tipo de línea, color, o fuente. Las definiciones de estilo se almacenan en un proyecto.

Si quiere tener estilos disponibles para un conjunto de proyectos, defina dichos estilos en un proyecto de plantilla.


ajuste local calibrado

La definición de un ajuste local utiliza la definición del sistema de coordenadas existente junto con una transformación de corrección. Con ello se logra la mejor adaptación de los datos GPS de un área concreta (o ubicación).

Las transformaciones de corrección adicionales son necesarias, ya que el sistema de coordenadas se ha diseñado para aplicarse en una zona amplia. Es por esto, que no permite variaciones en las coordenadas locales.

Es necesario que el nuevo trabajo se ajuste al punto de control existente, de forma que las transformaciones corrijan estas variaciones. Estas correcciones adicionales sólo son válidas en una zona limitada. Esto explica la terminología ‘ajuste local’ empleada.

El software Trimble Geomatics Office puede calcular las transformaciones adicionales requeridas para adaptarse a los puntos de control local, y guardar estas definiciones en la base de datos de sistemas de coordenadas.


coordenadas de calibración

Estas son las coordenadas WGS-84 (latitud/longitud/altura elipsoidal) generadas de un ajuste de punto de control fijo (mínimamente limitado) de su observación GPS, que se guardan en una calibración local GPS.

Al realizar la calibración, las coordenadas se utilizan como las coordenadas GPS observadas, asociadas a las coordenadas de cuadrícula de un punto concreto.


coordenadas cartesianas

Véase coordenadas cartesianas centradas en la Tierra/fijas en la Tierra.


prueba chi-cuadrado

Una prueba estadística general del ajuste de red. Es una prueba de la suma de los cuadrados de ponderación de los residuales, el número de grados de libertad y una probabilidad crítica del 95 por ciento o mayor.

El fin de esta prueba es rechazar o aceptar la hipótesis de que los errores previsibles se han calculado con exactitud.


desajuste horario

La diferencia constante en la hora de lectura entre dos relojes. En GPS, generalmente se refiere al desajuste entre los relojes SV y el reloj del receptor del usuario.


cierre

Acuerdo entre las partes medidas y las partes conocidas de una red.


CMR

Compact Measurement Record (Registro compacto de medición)

Un mensaje de medición de satélite que emite el receptor base y es utilizado por los levantamiento cinemáticos en tiempo real (RTK), con el fin de calcular un vector de línea base exacto entre la base y el móvil.


código de adquisición grosera (C/A)

Un código de ruido pseudoaleatorio (PRN) modulado en una señal L1. Este código ayuda a que el receptor calcule la distancia desde el satélite.


código

El código GPS es un código de ruido pseudoaleatorio (PRN) modulado en las señales portadoras del GPS.

El Código C/A no está clasificado y está disponible para utilizar en aplicaciones civiles.

El Código P también se conoce, y no está clasificado; pero puede estar codificado por razones de defensa nacional.

Las mediciones de código son la base del posicionamiento y navegación con GPS. El código también se utiliza en conjunción con las mediciones de fase portadora con el fin de obtener soluciones de línea base con calidad topográfica más precisa.


componente

Una de las tres observaciones topográficas utilizadas para definir una línea base tridimensional entre dos puntos de control. La misma línea base puede definirse por acimut, incremento de altura, y distancia (en coordenadas de elipsoide); por incremento X, incremento Y, e incremento Z (en coordenadas cartesianas fijas en la Tierra); y por incremento norte, incremento este, e incremento hacia arriba (en coordenadas del plano local).


constelación

Un conjunto de satélites concreto utilizado para calcular posiciones: tres satélites para fijos 2D, cuatro satélites para fijos 3D.

Todos los satélites visibles por un receptor GPS en un momento dado. La constelación óptima es la que tiene el valor PDOP más bajo. Véase también PDOP.


limitado (o restringido)

Mantener (fijar) una cantidad (observación y coordenada) como verdadera en un ajuste de red.


punto de control fijo o limitación

Límites externos impuestos sobre las cantidades ajustadas (observaciones y coordenadas) de un ajuste de red.


punto de control

Un punto marcado cuyas coordenadas han sido o van a ser asignadas, a observaciones topográficas.


observación convencional

Una observación de campo que se ha obtenido utilizando una estación total o un teodolito.


sistema de coordenadas

Un conjunto de transformaciones que permiten que las posiciones GPS (del elipsoide WGS-84) se transformen en coordenadas de proyección con elevaciones sobre el geoide.

Está constituido por una transformación de datum, un modelo geoidal asignado, y una definición de proyección de coordenadas.

La transformación de datum se define en la base de datos de sistemas de coordenadas. Incluye la definición del datum en el que se basa la proyección de coordenadas.

Al sistema de coordenadas se le puede asignar un modelo geoidal existente, pero también es posible especificar una separación geoidal constante en vez de utilizar un modelo geoidal. Use la utilidad Administrador de sistemas de coordenadas™ de Trimble para definir modelos geoidales en la base de datos de sistemas de coordenadas.

Usted puede asignar algunos tipos de proyección de coordenadas a los sistemas de coordenadas  (por ejemplo, Mercator transversal o Lambert de un paralelo). Los diversos países y regiones utilizan tipos de proyección diferentes con el fin de conseguir los mejores resultados (es decir, la mínima distorsión) en la proyección de las coordenadas. Los métodos de proyección de coordenadas proyectan los valores de latitud y longitud del datum apropiado a valores de coordenadas cartesianas. Las elevaciones de las coordenadas de proyección se logran utilizando el modelo geoidal asignado a los sistemas de coordenadas.

La utilidad Administrador de sistemas de coordenadas de Trimble le permite ver, editar, y añadir a las definiciones de sistemas de coordenadas suministradas con el software Trimble Geomatics Office.


correlacionadas
correlativas

Se dice de dos o más observaciones (o cantidades derivadas), que tienen un origen de error común como mínimo.


covarianza

Una medida de la correlación de errores entre dos observaciones o entre cantidades derivadas. También se refiere a un término fuera de la diagonal (es decir, no a una varianza) de la matriz varianza-covarianza.


matriz de covarianza

Una matriz que define la varianza y covarianza de una observación. Los elementos de la diagonal forman la varianza y todos los otros elementos que se encuentran a ambos lados de dicha diagonal constituyen la covarianza.


valores covariantes

En el software Trimble Geomatics Office, se refiere a la publicación de los errores propagados (calculados) a posteriori de acimut, distancia, y altura entre pares de puntos de control que resulten de un ajuste de red. El término covariante indica que este cálculo involucra la utilización de términos covariantes de la matriz varianza-covarianza de puntos de control ajustados.


vista actual

Utilizando el comando Ventana / Nueva ventana usted puede abrir las diversas vistas de la base de datos. Todas estas vistas tienen configuraciones diferentes. La vista actual es la que está activa y esto se indica con una  barra de títulos activa.


salto de ciclo

Una interrupción en el enganche del receptor en las señales de radio del satélite. El deslizamiento de ciclo impone el recálculo de las condiciones de ambigüedad del entero durante el procesamiento de líneas base.


registro de datos

El proceso de registro de datos de satélite en un archivo almacenado en el receptor, en un colector de datos que ejecuta el software Trimble Survey Controller, o en una tarjeta de PC.


mensaje de datos

Un mensaje, incluido en la señal GPS, que informa sobre la ubicación y condición de los satélites así como sobre las correcciones horarias. Incluye información sobre la condición de otros satélites así como su posición aproximada.


datum

Un modelo matemático de la Tierra diseñado para abarcar parte o todo el geoide. Se define por la relación entre el elipsoide y un punto de la superficie topográfica establecido como el origen del datum. Generalmente se conoce como datum geodésico.

El tamaño y forma de un elipsoide, así como la ubicación del centro del elipsoide con respecto al centro de la Tierra, generalmente se definen en los datums geodésicos mundiales.


Defecto datum

Discrepancias desconocidas entre dos conjuntos de coordenadas que sólo pueden rectificarse con una transformación de datum de un ajuste de red.


transformación de datum

Define la transformación utilizada para transformar las coordenadas de un punto definido de un datum a las coordenadas de otro datum.

El software Trimble Geomatics Office soporta varios métodos de transformación de datum diferentes:

  Siete parámetros

  Tres parámetros (también denominada Molodensky)

  cuadrícula de datum

 Regresión múltiple

Las transformaciones de datum generalmente convierten datos capturados del datum WGS-84, por métodos GPS, en los del datum utilizado en los proyectos de levantamiento y cartografía de regiones y países individuales.


eliminar

Quita la covarianza entre observaciones. Esto puede realizarse mediante transformaciones ortogonales complejas, o calculando ajustes horizontal y vertical separados.


desplazamiento de la vertical

La diferencia angular, entre la dirección hacia arriba de la línea de plomada (vertical), y la perpendicular (normal) al elipsoide.


grados de libertad

Una medida de la redundancia de una red.


incremento de elevación

La diferencia entre la elevación de dos puntos.


incremento de altura

El componente vertical de la expresión de líneas base GPS del software Trimble Geomatics Office. Es la diferencia de altura o cambio en altura.


incrementos N, E, y U

Diferencias de coordenadas expresadas en un sistema de coordenadas del horizonte geodésico local.


incrementos X, Y, y Z

Diferencias de coordenadas expresadas en un sistema de coordenadas cartesiano.


posicionamiento diferencial

La medición precisa de la posición relativa de dos receptores que rastrean los mismos satélites simultáneamente.


DOP

Dilution of Precision (Dilución de precisión)

Un indicador de la calidad de una posición GPS. Tiene en consideración la ubicación de cada satélite relativa a los otros satélites de la constelación, y su geometría en relación a un receptor GPS. Un valor DOP bajo indica una probabilidad de precisión mayor.

A continuación se enumeran los DOPs estándar para aplicaciones con GPS:

 Posición PDOP (tres coordenadas)

 Horizontal HDOP (dos coordenadas horizontales)

  RDOP

  Vertical VDOP (sólo altura)

  Tiempo TDOP (sólo desajuste horario)


efecto Doppler

El cambio de frecuencia aparente de una señal causado por el movimiento relativo entre los satélites y el receptor.


diferenciación doble

Un método aritmético de diferenciación de fase portadora medida simultáneamente por dos receptores que rastrean los mismos satélites. Este método elimina los errores del satélite y los errores horarios.


MDT

Modelo Digital del Terreno

Una representación electrónica tridimensional del terreno.


doble frecuencia

Un tipo de receptor que utiliza las señales L1 y L2 de los satélites GPS. Este tipo de receptor puede calcular fijos de posición más precisos en distancias más largas y bajo condiciones adversas ya que compensa el retraso ionosférico.


Centrado en la Tierra-Fijo en la Tierra (ECEF)

Sistema de coordenadas cartesiano utilizado por el marco de referencia WGS-84. En este sistema de coordenadas, el centro del sistema se ubica en el centro de la masa terrestre. El eje z coincide con el eje rotacional medio de la Tierra y el eje x atraviesa los 0° N y 0° E. El eje y es perpendicular al plano formado por los ejes x y z.


valor este

Lectura hacia el este de los valores de cuadrícula. De izquierda a derecha en una cuadrícula (eje X).


elevación

La altura sobre el nivel medio del mar o la distancia vertical sobre el geoide. La elevación también se conoce como altura ortométrica.


máscara de elevación

Un ángulo, que normalmente se configura en 13 grados. Si se rastrean satélites por encima de este ángulo, se evitará la interferencia generada por edificios, árboles, y errores por trayectoria múltiple.

Trimble recomienda que no siga satélites con un ángulo por debajo de 13 grados.


elipsoide

Un modelo matemático de la Tierra formado al rotar una elipse sobre su eje menor. En el caso de los elipsoides que modelan la Tierra, el eje menor es el eje polar y el eje mayor es el eje ecuatorial.

Un elipsoide se define al especificar las longitudes de ambos ejes, o al especificar la longitud del eje mayor del achatamiento.

Hay dos cantidades que definen un elipsoide. Normalmente, éstas están determinadas por

la longitud del semieje mayor, a, y

el achatamiento, [image], donde b es la longitud del semieje menor.


distancia elipsoidal

En el software Trimble Geomatics Office, es la longitud de la sección perpendicular entre dos puntos.

PRECAUCIÓN: La distancia elipsoidal no es la misma que la distancia geodésica.


altura elipsoidal

La distancia, medida a lo largo de la perpendicular, desde la superficie del elipsoide a un punto.


entidades

Elementos gráficos principales que pueden verse y seleccionarse desde la ventana gráfica.

Las entidades disponibles en el software Trimble Geomatics Office son puntos, líneas, arcos, curvas, texto, y anotaciones.


efemérides

Un conjunto de datos que describen la posición de un objeto celestial en función del tiempo. Todos los satélites GPS transmiten periódicamente una efemérides de emisión que contiene las posiciones previsibles en el futuro próximo, cargadas por el segmento de control. Los programas de posprocesamiento también pueden utilizar una efemérides precisa que describe las posiciones exactas de un satélite en el pasado.


época

El intervalo de medición de un receptor GPS. La época varía en función del tipo de levantamiento:

 para levantamientos en tiempo real se configura en un segundo

 para levantamientos con posprocesamiento puede especificarse en una tasa que varíe entre un segundo y un minuto


intervalo de época

El intervalo de medición utilizado por un receptor GPS; también se denomina ciclo.


error

La diferencia entre el valor medido de una cantidad y su valor verdadero. Los errores topográficos generalmente se dividen en tres categorías: meteduras de pata, errores sistemáticos y errores aleatorios. Para detectar y eliminar los dos primeros se utiliza el análisis por mínimos cuadrados y para medir y distribuir adecuadamente el error aleatorio se emplea el ajuste por mínimos cuadrados.


elipse de error

Una elipse de error de coordenadas es una representación gráfica de la magnitud y dirección del error de puntos ajustados de una red.


eventos

El registro de la ocurrencia de un acontecimiento, tal como el cierre del disparador de una cámara fotogramétrica. El receptor GPS puede registrar la marca de un evento que contenga la hora del mismo así como un comentario alfanumérico introducido por el teclado que describa el evento. El evento puede activarse con el teclado o mediante la introducción de una señal eléctrica en uno de los puertos del receptor.


EstáticoRápido

Un método de topografía con GPS que utiliza ocupaciones de hasta 20 minutos para capturar datos brutos GPS, que a continuación somete a posprocesamiento con el fin de lograr precisiones subcentimétricas. Generalmente, los tiempos de ocupación varían en función del número de satélites (SVs) a la vista:

  4 SVs necesitan 20 minutos*

  5 SVs necesitan 15 minutos*

  6 ó más SVs necesitan 8 minutos*

(*capturados con un intervalo de época de 15 segundos)


archivo de biblioteca de características y atributos (*.fcl)

Un archivo de texto que contiene las definiciones de códigos de característica, atributos, estilos CAD, y códigos de control.


códigos de característica

Palabras descriptivas o abreviaturas que describen las características que ve el usuario.


códigos de campo

Instrucciones especiales que indican al software Trimble Geomatics Office que inserte información en informes, archivos, y anotaciones.

Los códigos de campo se utilizan para manejar la transferencia de información de base de datos en operaciones de importación/exportación/informes ASCII.


solución final

La solución final proporciona el mejor cálculo del vector GPS entre dos puntos.

Esta se utiliza durante el posprocesamiento para generar vectores GPS, y, concretamente, de soluciones estáticas. El procesador de líneas base pasa de una solución a otra mediante un conjunto de técnicas de procesamiento y combinaciones de mediciones GPS. En general las soluciones posteriores son mejores que las anteriores.


fijo

Véase limitado.


coordenadas fijas

Coordenadas de punto que no se mueven cuando se realiza un ajuste de red.


solución fija

La solución que se obtiene, cuando el procesador de líneas base resuelve la búsqueda de ambigüedad del entero, y lo hace con una fiabilidad que le permite seleccionar el mejor conjunto de enteros. Recibe el nombre de solución fija ya que los valores reales calculados de las ambigüedades se han fijado en sus valores enteros correspondientes.


achatamiento

Una expresión matemática de las longitudes relativas de los ejes mayor y menor de un elipsoide.


achatamiento inverso

Una expresión del achatamiento que resulta más fácil de leer y editar.


solución flotante

La solución que se obtiene, cuando el procesador de líneas base no es capaz de resolver la búsqueda de ambigüedad del entero con suficiente fiabilidad, y, por lo tanto, no logra seleccionar el mejor conjunto de enteros. Se denomina ‘flotante’ porque la ambigüedad incluye una parte fraccionaria y no es entera.


ajuste libre

Realización de un ajuste de red en el que no hay puntos de control (coordenadas) fijos. El ajuste de red utiliza puntos de control fijos interiores.


distribución de frecuencia

El tamaño y dispersión de los residuales de un conjunto de datos. Se muestra gráficamente en histogramas.


totalmente limitado (o restringido)

Un ajuste en el que todos los puntos que forman parte de una red de control mayor se fijan en los valores publicados de las coordenadas. Se utiliza para mezclar redes de control grandes con redes de control pequeñas, y redes antiguas con redes nuevas.


GDOP

Geometric Dilution of Precision (Dilución de precisión geométrica)

La relación entre los errores de posición y tiempo del usuario, y los errores en la distancia del satélite. Véase también DOP.


acimut geodésico

El ángulo formado entre el meridiano geodésico y la tangente a la línea geodésica del observador, medido en el plano perpendicular a la normal del elipsoide del observador. Se mide desde el norte, en el sentido de las agujas del reloj.


datum geodésico

El elipsoide que mejor se aproxima al geoide.

Los datums geodésicos se definen por el tamaño y forma de un elipsoide y la ubicación en el centro del elipsoide con respecto al centro de la Tierra.

Se han establecido varios datums para adaptar de la mejor manera posible regiones específicas. Por ejemplo, los mapas europeos a menudo se basan en el Datum Europeo de 1950 (ED-50). Los mapas estadounidenses en el Datum Norte Americano de 1927 o en el de 1983 (NAD-27, NAD-83). Todas las coordenadas GPS se basan en la superficie del datum WGS-84.


coordenadas geográficas (geodésicas)

Latitud, longitud, y altura elipsoidal.


geoide

La superficie de equipotencial gravitacional que más se aproxima al nivel medio del mar. No es una forma matemática uniforme, sino una figura irregular con una forma general similar a la de un elipsoide.

Generalmente, las elevaciones de los puntos se miden con referencia al geoide. Sin embargo, los puntos fijados con métodos GPS tienen alturas establecidas en el datum WGS-84 (una figura matemática).

La relación entre el datum WGS-84 y el geoide debe determinarse por observación, ya que no hay una definición matemática sencilla que pueda describir la relación. El usuario debe emplear métodos topográficos convencionales para observar la elevación sobre el geoide, y a continuación comparar los resultados con la altura sobre el elipsoide WGS-84 en el mismo punto.

Reuniendo un número elevado de observaciones de la separación entre el geoide y el datum WGS-84 (separación geoidal), pueden establecerse archivos de cuadrícula de los valores de separación. Esto permite la interpolación de la separación geoidal en posiciones intermedias. Los archivos que contienen estas cuadrículas de separaciones geoidales se denominan modelos geoidales. Con una posición WGS-84 que forme parte de la cobertura de un modelo geoidal, el modelo puede ubicar la separación geoidal interpolada en esta posición.


modelo geoidal

Una representación matemática del geoide para una zona particular, o para toda la Tierra. El software utiliza el modelo geoidal con el fin de generar separaciones geoidales para los puntos de la red.


observación geoidal

Consiste de la separación geoidal y su error asociado, obtenidos del modelo geoidal. El ajuste de red del software Trimble Geomatics Office las trata de la misma manera que si fuesen observaciones con errores asociados. A medida que el ajuste progresa, las observaciones se convierten en observaciones de geoide ajustadas.


separación geoidal

La distancia entre el elipsoide y el geoide en un punto dado.


geomática

Se refiere al diseño, captura, almacenamiento, análisis, visualización, y recuperación de información espacial. La captura de información espacial puede proceder de diversas fuentes, que incluyan métodos GPS y métodos terrestres. La geomática integra las técnicas topográficas tradicionales con nuevos enfoques tecnológicos, por lo que resulta útil en gran variedad de aplicaciones.


GPS

Sistema de Posicionamiento Global

El GPS se basa en una constelación de veinticuatro (24) satélites que orbitan la Tierra a gran altitud.


línea base GPS

La medición tridimensional entre dos estaciones, en las que se han capturado y procesado datos GPS simultáneos con técnicas de diferenciación.

Representada como incremento X, incremento Y, e incremento Z; o acimut, distancia, e incremento de altura.


observaciones GPS

Una línea base GPS con errores asociados. A medida que el ajuste progresa, las observaciones se convierten en observaciones GPS ajustadas.


datos brutos GPS

Los datos, capturados por un receptor GPS, destinados para posprocesamiento. Estos pueden tener el formato de archivo.dat (formato de archivo de datos brutos de Trimble) o el de un archivo RINEX.


hora GPS

Una medida horaria utilizada por el sistema NAVSTAR GPS. La hora GPS se basa en la Hora Universal Coordinada (UTC) pero no añade segundos intercalares periódicos para corregir las modificaciones en el periodo de rotación terrestre.


cuadrícula

Un sistema de coordenadas rectangular, horizontal, y bidimensional (tal como una proyección cartográfica)


conversión de cuadrícula

La conversión de las coordenadas geográficas en las de la proyección del mapa.


distancia de cuadrícula

La distancia entre dos puntos que se expresa en coordenadas de la proyección del mapa.


distancia del terreno

La distancia (distancia horizontal con aplicación de curvatura) entre dos puntos del terreno.


HDOP

 Horizontal Dilution of Precision (Dilución de Precisión Horizontal)


varilla de medición

Un instrumento de medición suministrado con antena externa GPS que se utiliza para medir la altura de la antena sobre un punto.


AI

Altura del instrumento.

Sinónimo de altura de antena GPS.


histograma

Una presentación gráfica del tamaño y distribución de los residuales de un ajuste de red.


punto de control horizontal

Un punto que sólo tiene precisión de coordenada horizontal. La elevación o altura elipsoidal tiene una precisión menor o se desconoce.


distancia horizontal

La distancia entre dos puntos, calculada horizontalmente a partir de la elevación de cualquiera de los puntos.


posición horizontal

Un punto que sólo tiene coordenadas horizontales.


independiente

Redes secundarias, observaciones, y puntos de control no conectados por geometría o errores. Este término es antónimo de correlativo.


punto de control fijo interior

Un ajuste de red calculado sin fijar ninguna de las coordenadas del punto. El software Trimble Geomatics Office utiliza el centroide de la red como el punto de control fijo interior.


ambigüedad del entero

El número de ciclos completos de una pseudodistancia de fase portadora entre el satélite GPS y el receptor GPS.


búsqueda de enteros

procesamiento de líneas base GPS, en tiempo real o posprocesado, que requiere soluciones de entero fijas para obtener los mejores resultados. El software que procesa las mediciones GPS, y que se utiliza para derivar una línea base, realiza la búsqueda de enteros con el fin de obtener una solución de enteros fija. La búsqueda involucra la utilización de varias combinaciones de valores enteros y la selección de los mejores resultados.


solución libre de ionosfera (LibreIono)
solución libre de ionosfera (Libre de iono)

Una solución que utiliza la combinación de medidas GPS para modelar y quitar los efectos de la ionosfera en las señales GPS. Por lo general, esta solución se utiliza para levantamientos de control importantes, particularmente cuando se observan líneas base largas.


ionosfera

La banda de partículas cargadas que está a unos 128 - 192 kilómetros sobre la superficie terrestre. Si se miden líneas base largas utilizando receptores de frecuencia simple, la ionosfera afecta la precisión de las mediciones GPS.


modelo ionosférico

El retraso temporal causado por la ionosfera varía en función del tipo de frecuencia de las señales GPS, por lo que afecta a las señales L1 y L2 de forma diferente. Cuando se utilizan receptores de doble frecuencia para hacer observaciones, pueden usarse las observaciones de fase portadora para modelar y eliminar la mayor parte de los efectos ionosféricos. Cuando no haya disponibles mediciones de doble frecuencia, puede usarse el modelo ionosférico emitido por los satélites GPS, con el fin de reducir los efectos ionosféricos. Sin embargo, la utilización del modelo de emisión no es tan eficaz como el uso de medidas de doble frecuencia.


iteración

Un conjunto de cálculos de ajuste completo que incluye la formación de ecuaciones de observación, ecuaciones normales, ajustes de coordenadas, y cálculo de residuales.


levantamientos cinemáticos

Un método de topografía con GPS que utiliza ocupaciones breves del tipo ‘Parar y Seguir’, a la vez que mantiene el enganche en un mínimo de 4 satélites. Puede hacerse en tiempo real, o con posprocesamiento para obtener precisiones centimétricas.


inicialización del punto conocido

Este tipo de inicialización se utiliza en conjunción con la inicialización cinemática. Si hay dos puntos conocidos disponibles, el procesador de líneas base puede calcular un inverso entre ambos y derivar un vector de inicialización. Este vector, con componentes de línea base conocidos, se utiliza para ayudar a resolver la ambigüedad del entero. Si el procesador logra resolver la ambigüedad, es posible una solución entera fija que logra las mejores soluciones para los levantamientos cinemáticos.


L1

La portadora de banda L primaria utilizada por los satélites GPS para transmitir datos de satélite. La frecuencia es 1575,42MHz. Se modula por los códigos C/A, P y un mensaje de navegación de 50 bits/segundo.


L2

La portadora de banda L secundaria utilizada por los satélites GPS para transmitir datos de satélite. La frecuencia es 1227,6MHz. Se modula por el código P y un mensaje de navegación de 50 bits/segundo.


etiqueta

Información que puede asignarse a los puntos del proyecto. Aparece al lado de los puntos con el fin de facilitar su identificación. Las etiquetas son visibles en las vistas del levantamiento y del plano.

Para etiquetar puntos, puede utilizarse la definición de etiqueta predefinida del software Trimble Geomatics Office (por ejemplo, etiquetarlos con sus nombres, códigos de característica, y elevaciones).

Las etiquetas utilizan la misma fuente y tamaño que las sugerencias de las configuraciones de presentación de Microsoft Windows.

Para asignar etiquetas a los puntos de la base de datos, utilice Ver / Etiquetar puntos.


capas

Un lugar para almacenar grupos de datos.

La organización de datos en capas facilita su manejo. En un proyecto puede haber varias capas. Para asignar o reasignar una entidad a una capa, utilice la ventana Propiedades. El nombre de capa puede tener hasta 100 caracteres alfanuméricos.


mínimos cuadrados

Un método matemático para el ajuste de observaciones, basado en la teoría de probabilidad. En este método de ajuste, se minimiza la suma de los cuadrados de todos los residuales ponderados.


nivel de fiabilidad

Una medida de la fiabilidad de los resultados, expresada con un porcentaje o un valor sigma.


nivel de significación

Una expresión de probabilidad. Se dice que el error de un-sigma (estándar) tiene un nivel de significación del 68 por ciento. En el caso de los errores unidimensionales, un nivel de significación del 95 por ciento se expresa con 1.96 sigma, y un nivel de significación se expresa con 2.576 sigma.


elipsoide local

El elipsoide especificado por un sistema de coordenadas. Las coordenadas WGS-84 se transforman primero en este elipsoide antes de convertirse en coordenadas de la cuadrícula.


coordenadas geodésicas locales

La latitud, longitud, y altura de un punto. Las coordenadas en términos del elipsoide local.


horizonte geodésico local

Un plano a la altura elipsoidal de un punto dado, que es paralelo al plano tangente al elipsoide en dicho punto. Los valores de coordenadas para el horizonte geodésico local se expresan como Norte, Este, y Arriba. El HGL se utiliza para rotar las diferencias de coordenadas cartesianas EC, antes de modelar una línea base en el elipsoide. Los valores de acimut calculados a partir de los componentes del HGL deben corregirse para las desviaciones normales como parte del modelado del elipsoide.


módulo de cierre

Los módulos de cierre indican el error del conjunto de observaciones de una red.

El módulo de cierre se calcula seleccionando un punto a partir del cual se toman una o más observaciones, añadiendo una de esas observaciones a las coordenadas del punto, y calculando las coordenadas del segundo punto en función de esa observación. Este proceso se repite una o varias veces alrededor de un ‘bucle’ que finalmente termina en el punto de origen. Si no se produjo ningún error en las observaciones, la coordenada final calculada será exactamente igual que la coordenada de inicio original. Si se sustrae la coordenada calculada de la coordenada original se determina el error de cierre. Si este error se divide entre la longitud de la línea, el error puede expresarse en partes por millón.

Esta técnica también puede utilizarse con dos puntos diferentes siempre que ambos puntos sean conocidos y tengan un alto grado de precisión. También se denomina cierre poligonal.


eje mayor

Véase elipsoide.


ángulo cartográfico

El ángulo entre el norte de la cuadrícula de una proyección cartográfica y el meridiano de longitud de un punto dado. También conocido como convergencia.


proyección cartográfica

Una expresión matemática rigurosa de la superficie curva del elipsoide en una cuadrícula de coordenadas rectangular.


nivel medio del mar

La altura media de la superficie del océano en todas las etapas de marea. Utilizado como referencia para las elevaciones.


limitación mínima

Un ajuste de red en el que se utilizan puntos de control fijos para definir sistemas de coordenadas. Se utiliza para medir la consistencia interna de las medidas de las observaciones.


eje menor

Véase elipsoide.


modelado

En algunos sistemas de coordenadas definidos, como por ejemplo un elipsoide; el modelado sirve para expresar matemática y geométricamente, una observación y sus errores relacionados.


trayectoria múltiple

Interferencia similar a los fantasmas en las imágenes televisivas, que se produce cuando las señales GPS llegan a la antena después de atravesar varias trayectorias. La señal que atraviesa la trayectoria más larga producirá una estimación de pseudodistancia mayor y aumentará el error. Las trayectorias múltiples pueden producirse debido a reflexiones en estructuras próximas a la antena.


banda estrecha

Una combinación lineal de observaciones de fase portadora L1 y L2 (L1 + L2) que resulta útil para cancelar efectos ionosféricos de los datos de línea base capturados. La longitud de onda eficaz de la banda estrecha es 10.7 centímetros.


NAVDATA

El mensaje de navegación de 1500 bits emitido por todos los satélites GPS. Este mensaje contiene la hora del sistema, los parámetros de corrección horaria, los parámetros de modelos de retraso ionosférico, y la condición y efemérides del sistema. El receptor GPS puede utilizar esta información para procesar las señales GPS y así obtener la posición y velocidad del usuario.


red

Un conjunto de líneas base. Véase también red secundaria.


ajuste de la red

Solución de ecuaciones simultáneas diseñada para lograr el cierre de una red topográfica, al minimizar la suma de los cuadrados ponderados de los residuales de las observaciones.

La técnica de ajuste empleada por el software Trimble Geomatics Office unas veces se denomina variación de coordenadas, y otras método de observaciones indirectas.


estado de la red

Indica que una observación concreta va a incluirse en el ajuste.

 Red significa que se incluye en el ajuste

 Sin red significa que no se incluye en el ajuste


NMEA

 National Marine Electronics Association (Asociación Nacional para la comunicación con instrumentos electrónicos marinos)

La normativa NMEA 0183 define la interfaz para dispositivos electrónicos de navegación marina. Esta normativa define un número de ‘cadenas’ que se denominan cadenas NMEA y contienen información de navegación, como por ejemplo posiciones.

La mayoría de los receptores GPS de Trimble pueden sacar posiciones como cadenas NMEA.


normal

En geodesia, la línea recta perpendicular a la superficie del elipsoide.


curva de distribución normal

Una ilustración gráfica de la distribución teórica de variables aleatorias con respecto a un valor previsible con teorías de probabilidad. Utilizada con histogramas.


acimut de sección normal

Angle measured from the geodetic meridian of the observer to the observed point on the ellipsoid. Angulo medido desde el meridiano geodésico del observador al punto observado en el elipsoide.


valor norte

Lectura hacia el norte de un valor de cuadrícula.


residual de observación

La corrección aplicada a una observación, tal y como determine el ajuste.


observaciones

Véase observaciones topográficas.


tiempo de ocupación

El tiempo que se necesita ocupar una estación, o punto; con el fin de lograr el procesamiento de líneas base GPS. Este tiempo varía en función de la técnica topográfica, el tipo de receptor GPS utilizado, y la precisión requerida para los resultados finales. Los tiempos de ocupación pueden variar desde un par de segundos (levantamientos cinemáticos), a varias horas (control o levantamientos de deformación, que requieren los niveles de precisión y repetibilidad más altos).


origen

La intersección de los ejes de un sistema de coordenadas. El punto de origen.


altura ortométrica

La distancia entre un punto y la superficie del geoide. Generalmente se denomina elevación.


método de búsqueda al vuelo (OTF)

El procesamiento de líneas base GPS, en tiempo real o con posprocesamiento, que requiere soluciones enteras fijas para obtener los mejores resultados. (Véase búsqueda del entero.)

Históricamente, esta búsqueda se llevaba a cabo con mediciones capturadas con dos o más receptores estacionarios en sus puntos respectivos. Los receptores y softwares modernos pueden usar las mediciones capturadas con un receptor móvil. Debido al movimiento del receptor, se dice que este tipo de datos se ha capturado ‘Al vuelo’ (OTF) y la búsqueda del entero que utiliza estos datos se denomina ‘búsqueda OTF’.


periférico

Una observación que al someterse a análisis estadísticos tiene un residual demasiado grande para su error estimado. El término deriva de la posición gráfica de una observación en un histograma.


sobredeterminado

Una red para la que se han realizado más mediciones de las necesarias, al calcular las coordenadas de la red. Relacionado con redundancia.


código P

El código ‘preciso’ transmitido por los satélites GPS. Cada satélite tiene un código único que se modula en las ondas portadoras L1 y L2. El código P es sustituido por el código Y cuando el anti-espionaje está habilitado.


parámetro

Una variable independiente que determina los valores de las coordenadas de los puntos de una línea o superficie. Véase desconocidos.


paridad

Una forma de comprobación de errores utilizada en el almacenamiento y transferencia de datos digitales. Las opciones de paridad incluyen Par, Impar o Nada (Ninguna).


PDOP

Position Dilution of Precision (Dilución de Precisión de Posición)

Una cifra sin unidades que expresa la relación entre el error de la posición del usuario y el error de la posición del satélite. Geométricamente, PDOP es proporcional a 1 dividido por el volumen de la pirámide formada por las líneas que van desde el receptor a los cuatro satélites observados. Se considera que los valores buenos para el posicionamiento son pequeños, como por ejemplo 3. Los valores superiores a 7 se consideran malos. Así, un valor PDOP bajo indica que los satélites están muy separados. La relación entre PDOP y los otros tipos DOP es:


límite PDOP

Un parámetro del receptor que especifica el valor PDOP máximo para el posicionamiento. Cuando la orientación geométrica de los satélites genera un PDOP por encima del valor de la máscara de elevación, el receptor deja de calcular fijos de posición.


máscara PDOP

El valor PDOP más alto con el que un receptor calcula posiciones.


centro de fase

Véase corrección de fase de antena.


modelos de centro de fase

Un modelo utilizado para aplicar una corrección a una señal GPS basada en un tipo de antena específico. La corrección se basa en la elevación del satélite sobre el horizonte y modela variaciones eléctricas en la ubicación del centro de fase de la antena. Estos modelos resultan útiles para eliminar los errores introducidos cuando no se utilizan antenas idénticas en ambos puntos: el del móvil y el de la base. Véase también corrección de fase de la antena.


alineación vertical (o emplomado)

El acto de alinear la antena o instrumento a lo largo de una línea vertical (plomada) perpendicular a la superficie equipotencial del campo gravitatorio de la Tierra.


posiciones de punto

Véase posicionamiento autónomo.


posproceso

Procesamiento de los datos de satélite en una computadora después de su captura.


Partes por millón (PPM)

Una representación estándar del error de escala en las mediciones de distancia. Un error de 1 PPM generará un error de medición de 1 milímetro por cada 1000 metros de distancia recorrida.


efemérides precisa

Véase efemérides.


precisión

Una medida de la proximidad de variables aleatorias respecto a un valor calculado. Una precisión alta implica residuales pequeños. Generalmente se expresa como una parte, o alternativamente, en partes por millón.


Número pseudoaleatorio (Pseudorandom number)

Una secuencia digital de 1’s y 0’s que parecen estar distribuidos al azar en forma de ‘ruido’, pero que pueden reproducirse con exactitud. Los códigos PRN tienen un valor de autocorrelación bajo para todos los retrasos o demoras excepto cuando coinciden totalmente.

Cada satélite NAVSTAR puede identificarse con un código de ruido pseudoaleatorios C/A y P único, por lo que el término ‘PRN’ a veces se utiliza en vez de ‘satélite GPS’ o ‘SV’.


probabilidad

Un porcentaje estadístico que expresa qué parte de un número hipotético de observaciones va a encontrarse en los límites definidos. A veces se denomina nivel de significación.


valor probable

El valor ajustado para las observaciones y otras cantidades, suponiendo que el ajuste se ha realizado correctamente. La mejor aproximación posible al valor verdadero.


proyecto

El software Trimble Geomatics Office se aplica a los datos de proyectos. Un proyecto es algo así como el espacio de trabajo. Los proyectos nuevos siempre se crean a partir de plantillas, por lo que ‘heredan’ todos los elementos contenidos en las mismas. Desde ese momento, todo el trabajo nuevo sólo se guarda en el proyecto nuevo.

El proyecto contiene todas las observaciones brutas, puntos calculados, sistemas de coordenadas, definición, líneas, texto, y estilos CAD.


datum del proyecto

El datum asociado a un proyecto del software Trimble Geomatics Office. Todas las coordenadas locales se visualizan utilizando el datum del proyecto.


proyección

Utilizada para crear mapas planos que representan la superficie de la Tierra o partes de dicha superficie.


error propagado

Errores calculados derivados de errores de observación estimados y expresados en términos de posiciones de coordenadas. Los errores de coordenadas propagados pueden, a su vez, propagarse en errores relativos de acimut, distancia, e incremento de altura entre puntos.


prueba de aceptación de calidad

Una o varias pruebas en las que el software evalúa los datos de mediciones con GPS, con el fin de determinar si dichos datos cumplen con el conjunto de valores de tolerancia definidos por el usuario. Estas pruebas quitan los datos inadecuados (para que no puedan continuar procesándose), o los marcan indicando la necesidad de mejorar su calidad.


registros CC

Registros de Control de Calidad

Los registros CC contienen información sobre la calidad de la posición GPS medida. Se almacenan con el registro de punto.


razón

Durante la inicialización, el receptor determina el número de longitudes de onda enteras de cada satélite. Para un conjunto de enteros en particular, el receptor calcula la probabilidad de que sea el conjunto correcto.

Razón es la razón de la probabilidad de corrección del mejor conjunto actual de enteros con la probabilidad de corrección del siguiente mejor conjunto. Así pues una razón alta indica que el mejor conjunto de enteros es mucho mejor que cualquier otro, lo que nos hace pensar que es el correcto. La razón deber ser mayor que 5 para las inicializaciones de Punto nuevo y Al vuelo (OTF).


RDOP

 Relative Dilution of Precision (Dilución de Precisión Relativa)


cinemático en tiempo real

Un método de topografía con GPS en tiempo real que utiliza tiempos de ocupación cortos (‘parar y seguir’), mientras mantiene el enganche en un mínimo de 4 satélites. Este método requiere un vínculo de datos entre los receptores base y móvil.


coordenadas rectangulares

Coordenadas del sistema en que los ejes de referencia se intersectan en ángulos rectos.


perfil de columna reducido

Una versión abreviada de ecuaciones normales, en las que dichas ecuaciones se vuelven a ordenar, con el fin de minimizar la memoria de la computadora; requerida para almacenar todos los elementos distintos de cero.


redundancia

La cantidad por la que una red de control está sobredeterminada, o por la que tiene más observaciones de las imprescindibles para hacer los cálculos necesarios.


número de redundancia

La medida de los grados de libertad en una parte (en vez de en un todo), de una red de control.


líneas base redundantes

La línea base observada de un punto que ya ha sido conectada a la red por otras observaciones. Una línea de base redundante puede ser una reobservación independiente de una medición anterior, o la observación de un punto desde otra base. Es redundante porque proporciona más información de la necesaria para determinar un punto. Sin embargo, las observaciones redundantes son muy útiles para comprobar la calidad de mediciones anteriores.


observación redundante

Una observación repetida, o una observación que contribuya a sobredeterminar una red.


factor de referencia

Véase error típico de ponderación unitaria.


marco de referencia

El sistema de coordenadas de un datum.


estación de referencia

Una estación base.


variable de referencia

El cuadrado del factor de referencia.


errores relativos

Errores y precisiones expresados para puntos de control ajustados (y sus emparejamientos).


residual

La corrección, o ajuste, de una observación para lograr el cierre completo de una red de control. También se aplica a cualquier diferencia entre la cantidad observada y el valor calculado para dicha cantidad.


RINEX

 Receiver INdependent EXchange  (Formato independiente para el intercambio entre receptores)

Un formato estándar de archivo de datos brutos GPS que se utiliza para intercambiar archivos entre varios fabricantes de receptores.


RMS

 Root Mean Square (Error cuadrático medio)

RMS expresa la exactitud de la medición de un punto. Es el radio del círculo de error, dentro del cual van a encontrarse aproximadamente el 70% de los fijos de posición. Puede expresarse en unidades de distancia o en ciclos de longitudes de onda.


meridiano rotado

Una constante de zona para la proyección cartográfica Mercator oblícua.


rotación

En transformaciones de coordenadas, la rotación es el ángulo con el que se mueve el eje alrededor del origen del sistema de coordenadas.


móvil

Con este término se designa cualquier receptor GPS y computadora de campo móvil que capture datos en el campo. Las posiciones capturadas por un receptor móvil pueden corregirse diferencialmente con respecto a un receptor GPS base estacionario.


RTCM

Radio Technical Commission for Maritime Services (Comisión Radio Técnica para los Servicios Marítimos)

Una comisión establecida para definir un enlace de datos diferenciales para la corrección diferencial en tiempo real de receptores GPS móviles. Hay dos tipos de mensajes de corrección RTCM. Todos los receptores GPS de Trimble utilizan el protocolo RTCM Tipo 2.1


RTK

Real-time kinematic (cinemático en tiempo real)

Un tipo de levantamiento o medición GPS.


geometría del satélite

Posición y movimiento de satélites GPS durante un levantamiento GPS.


escalar

En mínimos cuadrados, un valor aplicado a las varianzas (errores) basado en el nivel de fiabilidad requerido.


ponderación escalar

La aplicación de un escalar a los errores estimados con el fin de lograr la ponderación adecuada de una observación. Los tres tipos de escalares disponibles en un ajuste de red del software Trimble Geomatics Office son:

 Valor por defecto, significa que el escalar se ha configurado en 1.00, el error inicial estimado sigue siendo el mismo

 Alternativo, significa que el escalar se ha configurado en el factor de referencia del ajuste anterior

 Definido por el usuario, significa que el usuario puede introducir un valor para el escalar

El escalar se aplica a los errores de observación utilizando uno de los siguientes métodos:

 Todas las observaciones

 Cada observación

 Grupos de componente de varianza


escala

Un multiplicador utilizado en coordenadas y otras variables lineales, tales como proyecciones cartográficas y transformaciones.


SDMS

 Survey Data Management System (Sistema para la gestión de datos topográficos)

Un conjunto de definiciones de formato para el almacenamiento de datos topográficos. AASHTO soporta este sistema.


disponibilidad selectiva (S/A)

Degradación artificial de las señales de los satélites llevada a cabo por el Ministerio de Defensa estadounidense. El error de las posiciones producido por SA puede ser de hasta 100 metros.


semieje mayor

La mitad del eje mayor.


semieje menor

La mitad del eje menor.


sesión

Período durante el cual uno o más receptores GPS registran datos de medición del satélite.


error de instalación

Errores en el centrado de la plataforma nivelante o altura de un instrumento en un punto de control.


toma aislada

Una línea base observada sin redundancia.


sigma

Un símbolo o término matemático del error típico.


frecuencia simple

Un tipo de receptor que sólo utiliza la señal GPS L1. Los efectos ionosféricos no se compensan.


calibración local

Proceso en que se calculan parámetros con el fin de establecer la relación entre las posiciones WGS-84 (latitud, longitud y altura elipsoidal) determinadas por observaciones GPS, y las coordenadas conocidas locales definidas por una proyección cartográfica y elevaciones sobre el nivel medio del mar. Los parámetros se utilizan para generar coordenadas de cuadrícula local a partir de WGS-84 (y viceversa) en tiempo real en el campo con métodos topográficos RTK.


dibujo del cielo

Un dibujo polar que muestra las trayectorias de los satélites visibles en el intervalo de tiempo para el que se ha seleccionado el gráfico. La elevación del satélite se reproduce en la dimensión radial y el acimut se muestra en la dimensión angular. El resultado representa la trayectoria del satélite tal como se le plantea a un observador que mire hacia abajo desde un lugar directamente por encima del punto topográfico.


tipos de solución

Una descripción de los datos y técnicas utilizados para obtener soluciones de línea base a partir de mediciones con GPS. Los tipos de solución típicos incluyen descripciones del tipo: código, real (flotante), y fijo/a. Estos describen técnicas utilizadas por el procesador de líneas base para obtener una solución de línea base. Los tipos de solución pueden también incluir descripciones del tipo: L1, L2, banda ancha, banda estrecha, o libre de ionosfera. Estos describen la forma en que se combinan las mediciones GPS para obtener resultados concretos. Para más información, véanse las referencias sobre procesamiento con GPS, en las que se profundiza más sobre estos términos y técnicas.


distancia inclinada

La distancia en el plano paralelo a la diferencia vertical (pendiente) entre los puntos.


SNR

Signal-to-Noise Ratio (Razón Señal-Ruido)

Una medida de la fuerza de la señal de un satélite. SNR va desde 0 (no hay señal) hasta 35.


error típico

un cálculo del error estadístico, según el cual el 68 por ciento de un número de observaciones infinito teóricamente dará lugar a errores absolutos menores o iguales a su valor.


error típico de ponderación unitaria

Una medida de la magnitud de los residuales observacionales de un ajuste de red comparados con los errores observacionales preajustados.


coordenadas de plano de estado

Definiciones de proyecciones cartográficas Conforme de Lambert y Mercator transversal especiales adoptadas por ley en Estados Unidos. Hay un conjunto de estas zonas para NAD-27, y otro para NAD-83.


estático (levantamiento)

Un método de topografía con GPS que utiliza ocupaciones largas (en ocasiones horas) para capturar datos brutos GPS, y a continuación posprocesarlos con el fin de lograr precisiones subcentimétricas.


red estática

Describe la geometría y orden en que se organizan y procesan las líneas base GPS capturadas con técnicas estáticas y estáticas rápidas. El procesador de líneas base primero examina el proyecto para localizar los puntos con las coordenadas de mayor calidad, y a continuación construye la red de procesamiento a partir de esos puntos. El resultado es un conjunto de líneas base estáticas que utilizan coordenadas de inicio precisas.


estado

Todas las observaciones y coordenadas tecleadas de un punto, tienen un campo de estado disponible en la página Resumen de la ventana Propiedades.

El estado puede estar Habilitado, Habilitado como comprobación, o Inhabilitado:

  Las observaciones y coordenadas habilitadas siempre se utilizan para recálculo con el fin de determinar la posición calculada del punto

 Las observaciones y coordenadas habilitadas como comprobación, sólo se utilizan si no hay ninguna habilitada

 Las observaciones y coordenadas inhabilitadas nunca se utilizan


modelo estocástico

Una referencia general sobre las técnicas empleadas para calcular los errores de un ajuste de red.


red secundaria

Un conjunto de líneas base conectadas entre sí por puntos de control comunes, e independientes (separadas) de cualquier otra línea base. En el software Trimble Geomatics Office, una red puede estar formada por una o varias redes secundarias, y una red secundaria puede estar constituida simplemente por una línea base y dos puntos de control.


super-trak

Un método de Trimble para el procesamiento de la señal L2 cuando el código P no es descifrable.


observaciones topográficas

Mediciones hechas a puntos de control, o realizadas entre dichos puntos utilizando instrumentos topográficos, que incluyan receptores GPS y equipo convencional.


SV

Satellite Vehicle o Space Vehicle (Vehículo satélite o Vehículo espacial)


símbolos y tipos de línea

Los símbolos y tipos de línea se mantienen usando las utilidades del Editor de símbolos y tipos de línea de Trimble. Use estos editores para crear nuevos símbolos y tipos de línea así como para editar los existentes. Los símbolos se almacenan en bibliotecas de símbolos y los tipos de línea en bibliotecas de tipos de línea.

El software Trimble Geomatics Office utiliza las bibliotecas de símbolos y tipos de línea actuales del sistema. Cuando se guarde una biblioteca editada, usted puede convertirla en la biblioteca del sistema (si aún no lo es).


errores sistemáticos

Un error que se produce con el mismo signo, y con frecuencia con la misma magnitud, en varias observaciones relacionadas.


tau (valor)

Un valor calculado a partir de una distribución de frecuencia interna basada en el número de observaciones, grados de libertad, y un porcentaje de probabilidad dado (95%). Este valor se utiliza para determinar si una observación no coincide con el resto de las observaciones del ajuste. Si el residual de una observación sobrepasa el tau, se marca como periférica. Las líneas tau en el histograma de residuales normalizados son las líneas verticales a la izquierda y la derecha del centro de la línea vertical.


criterio tau

La técnica estadística de Allen Pope para la detección de periféricos de observación. Para obtener más información al respecto, véase Pope (1976).


TDOP

Dilución de Precisión de Tiempo (Time Dilution of Precision).


observación terrestre

Es una observación de campo en la que se utiliza un telémetro de láser o un instrumento convencional.


TOW

 Time of Week (Hora de la semana)

TOW en segundos, hora GPS desde la medianoche del sábado/mañana del domingo.


rastreo

El proceso de recepción y reconocimiento de señales de un satélite.


transformación

La rotación, desplazamiento, y cambio de escala de una red con el fin de trasladarla de un sistema de coordenadas a otro.


grupo de transformación

Un grupo de observaciones seleccionado, que se utiliza para calcular los parámetros de transformación únicos a ese grupo de observaciones. Normalmente, todas las observaciones de un grupo son del mismo tipo, tienen errores parecidos y se han medido utilizando un método común.


parámetros de transformación

Un conjunto de parámetros derivados o definidos por el usuario para un ajuste de red, que transforman un datum en otro. En GPS, los parámetros normalmente se generan para transformar WGS-84 en el datum local.


plataforma nivelante

dispositivo de centrado utilizado para el montaje de antenas GPS y otros instrumentos topográficos en trípodes.


errores de centrado de la plataforma nivelante

Los errores asociados con el centrado (plomada o alineación) de la plataforma nivelante sobre el punto observado. Estos errores se calculan. El cálculo se basa en la calidad de los métodos topográficos y debe ser conservador.


corrección troposférica

corrección troposférica

La corrección aplicada a la medida de un satélite con el fin de corregir el retraso ionosférico.


modelo troposférico

modelo troposférico

Las señales GPS se demoran en la troposfera. El tiempo que dura el retraso varía en función de la temperatura, la humedad, la presión, la altura de la estación sobre el nivel del mar y la elevación de los satélites GPS sobre el horizonte. Las correcciones de las medidas de fase y de código pueden realizarse utilizando un modelo troposférico que tenga en cuenta estas demoras.


univariada

Una función matemática que describe el comportamiento de errores aleatorios unidimensionales en:

  ángulo

  distancia

  diferencia de altura

  elevación

  altura elipsoidal


URA

User Range Accuracy (Exactitud de distancia del usuario)

Una medida de los errores que pueden generarse por problemas en los satélites y por disponibilidad selectiva (S/A) si se utiliza un vehículo de satélite (SV) concreto. Un URA de 32 metros indica que la S/A está habilitada. El valor URA es establecido por el segmento de control y transmitido por los satélites.


desconocidos

Los ajustes calculados de las coordenadas y parámetros de transformación. También utilizados para calcular residuales de observación.


Nacional EE.UU.

Una agencia gubernamental de Estados Unidos que mantiene el datum geodésico nacional y todas las redes de control geodésico de Estados Unidos y sus territorios.


pie topográfico estadounidense

1200/3937 metros. La unidad oficial de medidas lineales de NAD-27.


UTC

Universal Time Coordinated (Hora universal coordinada)

Una hora estándar basada en la hora solar local media en el meridiano de Greenwich. Véase también hora GPS.


varianza

El cuadrado del error típico.


estimación del componente de la varianza

Una técnica de mínimos cuadrados para la estimación del error relativo de las diversas partes de una red.


grupo de varianza

Uno de los grupos de observaciones para los que la estimación del componente de la varianza se utiliza en un ajuste de red.


matriz de varianza-covarianza

El conjunto de números que expresan las varianzas y covarianzas en un grupo de observaciones.


VDOP

Vertical Dilution of Precision (Dilución de precisión vertical).


vector

Una línea tridimensional entre dos puntos.


vertical

Similar a la normal, con la excepción de que se calcula a partir del plano tangente al geoide en lugar del plano tangente al elipsoide.


ajuste vertical

Un ajuste de red que sólo tiene observaciones y coordenadas verticales.


punto de control vertical

Un punto que sólo tiene precisión de coordenada vertical. La posición horizontal es de menor precisión o se desconoce.


WAVE

Weighted Ambiguity Vector Estimator (Estimador de vectores de ambigüedad ponderada)

WAVE es el procesador de líneas base de Trimble. Calcula vectores GPS a partir de observaciones de campo efectuadas con procedimientos de captura de datos Estático, Estático rápido, o Cinemático.


ponderación

El inverso de la varianza de una observación.


estrategia de ponderación

La recopilación de valores utilizados para aumentar las matrices de varianza-covarianza en el software Trimble Geomatics Office.


ponderaciones

El conjunto de ponderaciones, o el inverso de la matriz de varianza-covarianza de observaciones correlacionadas.


WGS-84

World Geodetic System (1984) - Sistema geodésico mundial de 1984

El elipsoide matemático utilizado por el GPS desde enero de 1987.


banda ancha

Una combinación lineal de observaciones portadoras de fase L1 y L2 (L1 - L2). Es útil por su longitud de onda baja (86,2 cm) y por su capacidad para localizar ambigüedades de entero en líneas base largas.


X, Y y Z

En un sistema cartesiano centrado en la Tierra, la X se refiere a la dirección del eje de coordenadas que va desde el origen del sistema al meridiano de Greenwich; Y al eje que va desde el origen 90° al este del meridiano de longitud, y Z al polo. En los sistemas de coordenadas rectangulares, X se refiere al eje este-oeste, Y al eje norte-sur, y Z al eje de altura.


código Y

El código Y es la información contenida en el código P adicionalmente codificada. Los satélites transmiten el código Y en lugar del código P cuando el antiespionaje está habilitado.


retraso del cenit

El retraso, causado por la troposfera, de una señal GPS observada desde un satélite directamente por encima de la cabeza. A medida que el satélite se aproxima al horizonte, la trayectoria de la señal al atravesar la troposfera se hace más larga y el retraso aumenta.


Archivos de efemérides de precisión GPS

Un archivo de efemérides de precisión contiene datos de posición precisos y correcciones horarias para cada satélite, correspondientes a algún periodo de tiempo específico, generalmente un día. Esta información es utilizada por el procesador de líneas base para mejorar la precisión de la línea base reduciendo los efectos de los errores de emisión de las efemérides. El uso de una efemérides de precisión ayuda también al procesador de líneas base a conseguir soluciones fijas en líneas base de gran longitud.

Trimble Geomatics Office soporta el uso de efemérides de precisión en dos formatos de archivos:

  .sp3 - Un formato ASCII definido por la Topografía Geodésica Nacional de los EE. UU. Este es el formato más ampliamente disponible.

  .ef18 - Un archivo binario con información similar a la incluida en los archivos .sp3. Los archivos .ef18 requieren menos espacio en el disco y son utilizados con mayor eficacia por el procesador de líneas base.

La opción Efemérides en el diálogo Estilo de procesamiento de líneas base GPS activo controla el uso de efemérides de precisión. Los archivos de efemérides de precisión deben ser importados a cada proyecto en que se van a utilizar. Utilice Archivo / Importar para cargar uno o más archivos efemérides de precisión en un proyecto.

Originalmente, los archivos de efemérides de precisión proporcionan las posiciones de los satélites y los desajustes horarios para una semana. Sin embargo, los archivos actuales proporcionan esta información únicamente para un solo día. Esto significa que los archivos pueden estar disponibles en un período más corto.

El procesador de líneas base requiere que la diferencia temporal de la efemérides de precisión exceda la diferencia temporal de las mediciones GPS que están siendo procesadas por un mínimo de ocho épocas de SV, tanto antes como después del inicio de los datos. Esta información adicional de la efemérides de precisión es necesaria para asegurar la adecuada interpolación tanto al inicio como al final del levantamiento.

La utilidad de importación de efemérides de precisión realiza lo siguiente:

  Examina el formato del archivo. Si el archivo está en el formato .sp3 se lo convierte automáticamente al formato .ef18 durante la importación. Si el  archivo está en el formato .ef18, se lo utiliza directamente.

  Determina si ya hay archivos de efemérides de precisión cargados en el proyecto. Si así fuera, examina la cobertura de esos archivos para determinar si el nuevo archivo abarca el mismo periodo que la cobertura existente. En este caso, el nuevo archivo sobrescribe al antiguo y en el Informe para importar aparece un mensaje de advertencia para indicar que esto ha ocurrido.

  Copia el archivo en la carpeta Efemérides de precisión del proyecto.

Los archivos de efemérides de precisión están disponibles en diversas fuentes, entre las que se incluyen:

  Topografía Geodésica Nacional de los EE.UU.

  Centro para la Determinación de Orbitas en Europa (CODE)

  Agencia europea del espacio

  Centro Scripps de Orbitas y Agrupación Permanente (SOPAC)

 Departamento de Energía, Minas y Recursos (EMR) del Canadá

  Laboratorio de Propulsión a Reacción (JPL) de la NASA


Para importar un archivo de efemérides de precisión (.sp3, .e18) a su computadora

1.	Seleccione Archivo / Importar. Aparecerá el diálogo Importar.

2.	En la ficha Levantamiento, seleccione la opción Archivos de efemérides de precisión (*.sp3, *.e18).

3.	Haga clic en Aceptar. Aparecerá el diálogo Abrir.

4.	Localice los archivos .sp3 o .e18 que desee importar.

5.	Haga clic en Abrir.

Los archivos se cargan en la carpeta Efemérides de precisión del proyecto.

NOTA: Si los archivos de efemérides de precisión que se van a importar cubren la misma diferencia temporal que los archivos de efemérides de precisión que ya existen en el proyecto, aparecerá un mensaje. Este mensaje muestra que durante la importación se han generado uno o más archivos. Para ver los detalles de los mismos, haga clic en Sí en este mensaje.

NOTA: La opción Efemérides en el diálogo Estilo procesamiento líneas base GPS activo controla el uso de efemérides de precisión.


Visión de conjunto sobre el registro

Si registra el software Trimble Geomatics Office y suministra los detalles para contactarle, Trimble podrá enviarle cualquier nueva información relacionada con el software ni bien está disponible; esto incluye información sobre nuevas mejoras del producto. Dicho registro ayuda a Trimble a mejorar continuamente el soporte y desarrollo del producto.

El software Trimble Geomatics Office se puede registrar cuando se le solicita al final del proceso de instalación o en cualquier momento dentro de Trimble Geomatics Office.

Para hacerlo:

1.	En Trimble Geomatics Office, seleccione Ayuda / Registro.

2.	Seleccione un método de registro. Utilice una de las siguientes alternativas:

  Complete y presente el formulario de registro que se provee en Internet.

  Imprima el formulario de registro que se suministra, complételo y envíelo por fax o correo.

Las preguntas de los formularios para registrarse a través de Internet y fax/correo son iguales.

La información que suministra no se utiliza ni distribuye fuera de Trimble. Los formularios de registro contienen también preguntas acerca de cómo y por qué utiliza Trimble Geomatics Office. Estas preguntas no son obligatorias, pero sus respuestas ayudan una vez más a Trimble a mejorar el soporte y desarrollo del producto.


Registro - Comando Por Internet

 Visión de conjunto y más información

Para registrar el software Trimble Geomatics Office por Internet:

1.	Seleccione Ayuda / Registro / Por Internet.  En el Buscador Web aparecerá la página de Registro en pantalla.

2.	Complete el formulario y asegúrese de suministrar los detalles para todos los campos marcados *.

3.	Haga clic en Enviar registro ahora.


Registro - Por fax o por correo

 Visión de conjunto y más información

Para registrar el software Trimble Geomatics Office por fax o por correo:

1.	Seleccione Ayuda / Registro / Por fax o por correo.  En el editor de texto por defecto aparecerá el formulario de registro de Trimble Geomatics Office.

2.	Complete el formulario y asegúrese de suministrar los detalles para todos los campos marcados *.

3.	Guarde el formulario.

4.	Envíe el formulario a:

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

USA

Attention: Technical Publications Group

Fax: +1 720 887-6101


Informe de módulos de cierres GPS - Visión de conjunto
    Informe de módulos de cierres GPS − Visión de conjunto

Más información

Cómo ...	Informe	Véase también
Visión de conjunto

El Informe de módulos de cierres GPS sirve para ayudar a juzgar la calidad de un conjunto de observaciones GPS dentro de una red. Se lo puede usar para comprobar si los resultados del procesamiento de líneas base contienen errores (si tiene instalado el módulo Baseline Processing [Procesamiento de líneas base]). Sin embargo, para generar módulos de cierres debe haber diseñado la red para que tenga figuras geométricas cerradas. Si este fuera el caso, Trimble Geomatics Office generará automáticamente todos los módulos posibles y producirá un informe de módulos de cierres GPS.

El diálogo Configuraciones de módulos de cierres se utiliza para controlar cómo se construyen y analizan los módulos También se usa para controlar la cantidad de información en el informe de módulos de cierres GPS. A las configuraciones de módulos de cierres se accede desde Informes / Configuración / Informe de módulos de cierres GPS.

El informe de módulos de cierres GPS por defecto consta de las siguientes secciones:

  Cabecera

  Resumen

  Módulos fallidos

  Observaciones en módulos fallidos

  Ocupaciones en módulos fallidos

En el informe se pueden incluir las siguientes secciones adicionales seleccionándolas en el diálogo Configuraciones de módulos de cierres:

  Detalles módulo fallido

  Módulos pasados

  Detalles módulo pasado

Considere estas reglas:

  Los pequeños errores de cierre son deseables. Un error de cierre grande indica que existe un problema con una o más observaciones en el módulo.

  Los errores de cierre elevados son debidos a menudo a equivocaciones cometidas en el campo, tales como la introducción de una información incorrecta sobre la antena o la instalación inadecuada de una estación. Compruebe sus notas de campo para verificar la información asociada con observaciones que hayan sido indicadas como pertenecientes a múltiples módulos fallidos.

  Cuando diseñe una red para que consista en figuras geométricas cerradas, asegúrese de que la red se observe de forma tal que incluya líneas base de distintas sesiones en cada figura. Si un módulo se genera utilizando líneas base que fueron observadas en la misma sesión, no se pueden detectar los errores comunes de instalación de la estación.

NOTA: Del Informe de módulos de Cierre, se puede vincular a módulos GPS en la vista del Levantamiento.


Informe de módulos de cierres GPS - Cabecera
    Informe de módulos de cierres GPS − Cabecera

Más información

Cómo ...	Informe	Véase también
La cabecera del informe está incluida en cada informe. En ella se incluye información general extraída sobre el proyecto y una sección Contenido. La sección Contenido dispone de hipervínculos que sirven para saltar a las diversas secciones del informe.

La cabecera muestra los siguientes campos, la mayoría de los cuales contienen información que usted ha especificado en las propiedades del proyecto:

Proyecto

Este campo muestra el nombre del proyecto.

Nombre del usuario

Este campo muestra el nombre.

Fecha y Hora

Este campo muestra la fecha y hora en que el informe fue generado.

Sistema de coordenadas

Este campo muestra el sistema de coordenadas del proyecto.

Zona

Este campo muestra la zona del sistema de coordenadas. Si se selecciona una calibración local GPS, el nombre del local se muestra  en el campo Zona.

Todos los sistemas de coordenadas publicados tienen una zona. La única excepción es la proyección por defecto que muestra ‘por defecto’ en el campo Zona. La proyección por defecto se usa cuando se suponen las coordenadas de un ajuste local, por ejemplo N = 10000, E = 10000, y elev = 100.

Datum del proyecto

Este campo muestra el datum. Este no representa el datum seleccionado para el ajuste.

Datum vertical

Puede añadir este campo a la información de cabecera del Informe de Ajuste de la red. Para hacer esto, añada los detalles necesarios al campo Datum Vertical en el diálogo Propiedades Proyecto – ficha Detalles Proyecto.

Modelo geoidal

Este campo muestra el modelo geoidal si un modelo fue asignado a las propiedades del proyecto. Cuando no se asigna un modelo geoidal al proyecto, aparecerá ‘No seleccionado’ en este campo.

Unidades de coordenadas

Este campo muestra las unidades del sistema de coordenadas.

Unidades de distancia

Este campo muestra las unidades de distancia.

Unidades de altura

Este campo muestra las unidades de altura.

Contenido

El contenido del informe de módulos de cierres GPS está controlado por las configuraciones en el diálogo Configuraciones de módulos de cierres. El informe de módulos de cierres GPS por defecto consta de las siguientes secciones:

  Cabecera

  Resumen

  Módulos fallidos

  Observaciones en módulos fallidos

  Ocupaciones en módulos fallidos

En el informe se pueden incluir las siguientes secciones adicionales seleccionándolas en el diálogo Configuraciones de módulos de cierres:

  Detalles módulo fallido

  Módulos pasados

  Detalles módulo pasado


Informe de módulos de cierres GPS - Resumen
    Informe de módulos de cierres GPS − Resumen

Más información

Cómo ...	Informe	Véase también
La sección Resumen proporciona una rápida visión de conjunto de los resultados del análisis de módulos de cierres. Está incluido en el informe por defecto y contiene la siguiente información:

Tramos en el módulo

Este campo muestra el número de observaciones utilizadas para formar los lados del módulo. El valor por defecto es de 3. Si se especifican más de 3 tramos, se generarán todos los módulos que tengan ese número de tramos, o menos. Si, por ejemplo, se especifica 5, se considerarán en el informe todos los módulos que tenga 5, 4 ó 3 lados.

Número de módulos

Este campo muestra el número total de módulos generados.

Número pasado

Este campo muestra el número de módulos que pasan los criterios de aceptación.

Número fallido

Este campo muestra el número de módulos que fallan los criterios de aceptación.

Criterios de pase / fallo

Estos campos muestran los valores absolutos de tolerancia horizontal y vertical.

Mejor

Estos campos muestran los resultados del mejor módulo generado.

Peor

Estos campos muestran los resultados del peor módulo generado.

Módulo medio

Estos campos muestran los resultados de la media de todos los módulos generados para este informe.

Desviación típica

Estos campos muestran las desviaciones típicas de todos los módulos generados para este informe.


Informe de módulos de cierres GPS - Módulos fallidos
    Informe de módulos de cierres GPS − Módulos fallidos

Más información

Cómo ...	Informe	Véase también
La sección Módulos fallidos proporciona información acerca de cada módulo que falla en la prueba de tolerancia de error de cierre. Un módulo falla cuando el error de cierre es mayor que las tolerancias especificadas en el diálogo Configuraciones de módulos de cierres GPS. Esta sección está incluida en el informe por defecto.

A continuación se ofrece un ejemplo de una sección del informe que muestra un módulo fallido:

Módulo GPS 1:
MOON 2:WAVE:N 245:MOON 2

Observaciones:

		De	A	Tipo de solución	Tiempo de inicio
LB3	S1	MOON 2	WAVE	L1 fija	13:45:03 24 Feb 1999
LB47	S5	MOON 2	WAVE	L1 fija	13:11:03 24 Feb 1999
LB2	S8	WAVE	N 245	L1 fija	13:45:03 24 Feb 1999
LB46	S4	MOON 2	N 245	L1 fija	13:43:48 24 Feb 1999
LB49	S7	MOON 2	N 245	L1 fija	12:28:33 24 Feb 1999

Combinaciones fallidas para el módulo 1:

	Longitud	DHoriz	dVert	Ppm
S5 – S8 – S7	3295.499m	0.026m	0.034m	12.915

Tabla de observaciones

Las dos primeras columnas de la tabla representan los IDs de la línea base y de la solución, respectivamente, de las observaciones GPS utilizadas en el módulo. El ID de la línea base representa la combinación de dos conjuntos superpuestos de datos GPS que pueden ser procesados para formar una línea base. El ID de la solución representa una resolución real de la línea base por el procesador de líneas base. Puede haber múltiples IDs de solución para un solo ID de línea base. Esto ocurre cuando la casilla de verificación Sobrescribir soluciones duplicadas de la línea base está inhabilitada al Guardar resultados de procesamiento GPS.

Las restantes columnas son las siguientes:

De

Este campo muestra el punto inicial de la observación.

A

Este campo muestra el punto final de la observación.

Tipo de solución

Este campo muestra el tipo de solución para la observación.

Tiempo de inicio

Este campo muestra la hora inicial de la observación.

Tabla Combinaciones fallidas para el módulo #

La tabla Combinaciones fallidas para el módulo identifica la combinación de observaciones GPS que generaron un error de cierre mayor que los criterios de aceptación. El ejemplo anterior muestra una sola combinación. Si se producen varios fallos se listarán en la tabla múltiples combinaciones. La primera columna de la tabla muestra las soluciones de la línea base en la combinación fallida.

SUGERENCIA: Si hace clic en la combinación fallida, las observaciones son resaltadas en la vista de Levantamiento.

Las restantes columnas son las siguientes:

Longitud

Este campo muestra la distancia total recorrida alrededor del módulo.

dHoriz

Este campo muestra el error de cierre horizontal generado por este módulo.

dVert

Este campo muestra el error de cierre vertical generado por este módulo.

Ppm

Este campo muestra el error de cierre total, horizontal y vertical, expresado en partes por millón.


Informe de módulos de cierres GPS - Observaciones en módulos fallidos
    Informe de módulos de cierres GPS − Observaciones en módulos fallidos

Más información

Cómo ...	Informe	Véase también
Esta sección ayuda a identificar las líneas base GPS que no encajan en la red. Esto se logra examinando todos los módulos fallidos e informando todas las líneas base que se encuentran en múltiples módulos fallidos. La lista se ordena de manera que las líneas base que ocurren en los módulos más fallidos se listan en la parte superior. También incluye estadísticas del resumen de la línea base que pueden ayudar a identificar soluciones malas.

Esta sección está incluida en el informe por defecto.

A continuación se muestran ejemplos de secciones del informe:

		De	A	Tipo de solución	Razón	Var ref	RMS	# de ocurrencias
LB2	S8	WAVE	N 245	L1 fija	21.8	2.489	0.006	3
LB47	S5	MOON 2	WAVE	L1 fija	2.9	1.693	0.005	2
LB5	S19	COWBOY	KTOM	L1 fija	8.5	1.117	0.009	1

Volver arriba

Las dos primeras columnas de la tabla representan los IDs de la línea base y de la solución, respectivamente, de las observaciones GPS incluidas en múltiples módulos fallidos. El ID de la línea base representa la combinación de dos conjuntos de datos GPS superpuestos que pueden ser procesados para formar una línea base. El ID de la solución representa una resolución real de la línea base por el procesador de líneas base. Puede haber múltiples IDs de solución para un solo ID de línea base. Esto ocurre cuando la casilla de verificación Sobrescribir soluciones duplicadas de la línea base está inhabilitada al guardar resultados de procesamiento GPS.

Las restantes columnas son las siguientes:

De

Este campo muestra el punto de inicio de la observación.

A

Este campo muestra el punto final de la observación.

Tipo de solución

Este campo muestra el tipo de solución para la observación.

Tiempo de inicio

Este campo muestra la hora inicial de la observación.

Razón

Este campo muestra la razón de la observación GPS según la determina el procesador de la línea base.

Var ref

Este campo muestra la varianza de referencia de la observación GPS según la determina el procesador de la línea base.

RMS

Este campo muestra el RMS de la observación GPS según la determina el procesador de la línea base.

# de ocurrencias

Este campo muestra el número de módulos fallidos de los la observación GPS fue parte. Las observaciones con un mayor número de ocurrencias deben ser revisadas con respecto a cómo encajan en el ajuste de la red.


Informe de módulos de cierres GPS - Ocupaciones en módulos fallidos
    Informe de módulos de cierres GPS − Ocupaciones en módulos fallidos

Más información

Cómo ...	Informe	Véase también
Esta sección ayuda a identificar las ocupaciones de estaciones GPS para las líneas base que no encajan en la red. Estas ocupaciones de estación pueden contener errores de configuración de la estación. Eso se logra examinando todos los módulos fallidos, determinando las líneas base que se encuentran en múltiples módulos fallidos, e informando luego las ocupaciones que son comunes a estas líneas base. La lista se ordena de manera que las líneas base que ocurren en los módulos más fallidos se listan en la parte superior.

Esta sección está incluida en el informe por defecto.

A continuación se muestra un ejemplo de esta sección del informe:

Ocupaciones en módulos fallidos

Punto	Tiempo de inicio	# de ocurrencias
KTOM	10:46:18 24 Feb 1999	6
WAVE	13:11:03 24 Feb 1999	5
MOON2	12:04:48 24 Feb 1999	4
COWBOY	14:05:03 24 Feb 1999	3
N 245	12:28:33 24 Feb 1999	2
COWBOY	12:45:48 24 Feb 1999	1
Volver arriba

Las columnas son como sigue:

Punto

Este campo muestra el nombre del punto en el que ocurrió la ocupación.

Tiempo de inicio

Este campo muestra la hora de la ocupación. Utilice la hora para verificar sus notas de campo respecto a la información contenida en el proyecto.

# de ocurrencias

Este campo muestra el número de veces que esta ocupación fue utilizada para una observación incluida en un módulo fallido. Las ocupaciones con mayor número de ocurrencias deben ser examinadas respecto a errores de instalación.


    Informe de módulos de cierres GPS - Detalles módulo fallido

Más información

Cómo ...	Informe	Véase también
Esta sección proporciona una información más detallada acerca de cada módulo que haya fallado la prueba de tolerancia de errores de cierre. Esta sección no está incluida en el informe por defecto. Esta sección se puede habilitar en el diálogo Configuraciones de módulos de cierres.

A continuación se muestra un ejemplo de esta sección del informe:

Detalles módulo fallido

Módulo S1 - S86 - S3:

De:	MOON 2
A:	WAVE		L1 fija	13:45:02 24 Feb 1999
		Pendiente:	962.407m	606819.055m
		Total:	962.407m	1828548.125m
				29.499m
A:	N 245		L1 flotante	13:45:02 24 Feb 1999
		Pendiente:	852.542m	606662.061m
		Total:	1814.949m	1829386.030m
				33.251m
A:	MOON 2		L1 fija	13:43:47 24 Feb 1999
		Pendiente:	1480.504m	605983.905m
		Total:	3295.453m	1828070.086m
				26.770m
Precisión:		32.407ppm
Errores	Horiz:	0.096m	Vert:	−0.046m

En la parte superior de la tabla figura una lista de las soluciones de líneas base incluidas en el módulo. Esto va seguido de la estación “de”, que es el punto a partir del cual se origina el módulo.

Esta información inicial está seguida de tres o más subsecciones, cada una compuesta por cuatro filas. Estas subsecciones contienen información sobre la estación, que se proporciona en el orden en que el programa transcurre alrededor del módulo. La primera fila de cada subsección comienza con un identificador A:. En estas subsecciones de estación se proporciona la siguiente información:

Fila 1

El identificador A: es la primera fila de una subsección de cuatro filas. La propia fila proporciona información acerca de la observación GPS. El identificador A: va seguido del nombre del punto, listado en el orden en que se recorre el módulo. A esto sigue el tipo de observación GPS y la fecha en que se capturaron las mediciones GPS.

La información que se proporciona en esta fila corresponde a uno de los IDs de la solución que figura en parte superior de la tabla. Se puede obtener información más detallada acerca de una solución de base línea específica examinando sus estadísticas mediante la ventana Propiedades en la Vista del levantamiento, o generando un informe de procesamiento de líneas base GPS para esa línea base.

Fila 2

El identificador Pendiente denota la segunda fila de una subsección de cuatro filas. Este identificador va seguido de la distancia inclinada de la observación GPS. Esta va seguida del componente Norte de las coordenadas del punto actual “A”.

Fila 3

El identificador Total denota la tercera fila de una subsección de cuatro filas. El identificador va seguido de la distancia total recorrida hasta el momento en la construcción del módulo. Esta va seguida del componente Este de las coordenadas del punto actual “A”.

Fila 4

La última fila de la subsección no tiene identificador. Contiene la altura de las coordenadas del punto actual “A”.

NOTA: Las coordenadas Norte, Este y altura que aquí figuran no será las mismas coordenadas que se encuentran en el proyecto. Los valores que aquí se muestran se derivan añadiendo las observaciones GPS a las coordenadas de la estación inicial “De” y prolongando esta adición vectorial alrededor del módulo. Al final del módulo, las coordenadas derivadas de esta manera se substraen de las coordenadas iniciales del punto “De” para generar el error de cierre.

La última subsección de estación en esta tabla es para la estación “De”, que indica que el módulo se ha cerrado. Las dos últimas filas de la tabla proporcionan información acerca del error de cierre del módulo.

Precisión

Este campo muestra el error de cierre total, horizontal y vertical, expresado en partes por millón.

Errores

Este campo muestra los errores horizontal y vertical generados por este módulo.


Informe de módulos de cierres GPS - Módulos pasados
    Informe de módulos de cierres GPS − Módulos pasados

Más información

Cómo ...	Informe	Véase también
Esta sección proporciona información acerca de cada módulo que pasa la prueba de tolerancia. Un módulo pasa cuando sus errores de cierre son menores o iguales que las tolerancias especificadas. Esta sección no está incluida en el informe por defecto. Esta sección se puede habilitar en el diálogo Configuraciones de módulos de cierres.

A continuación se muestra un ejemplo de esta sección del Informe:

Módulos pasados

Módulo GPS 1:
MOON 2: WAVE: COWBOY: MOON 2

Observaciones:

ID línea base	ID solución	De	A	Tipo de solución	Tiempo de inicio
LB3	S1	MOON 2	WAVE	L1 fija	13:45:02 24 Feb 1999
LB47	S4	MOON 2	WAVE	L1 fija	13:11:02 24 Feb 1999
LB1	S9	WAVE	COWBOY	L1 fija	14:05:02 24 Feb 1999
LB45	S2	MOON 2	COWBOY	L1 fija	14:05:02 24 Feb 1999
LB48	S5	MOON 2	COWBOY	L1 fija	12:45:47 24 Feb 1999
Combinaciones pasadas para el Módulo 1:

	Longitud	dHoriz	dVert	Ppm
S1 - S9 - S2	3795.569m	0.001m	-0.002m	0.508
S1 - S9 - S5	3795.577m	0.009m	0.001m	2.296
S4 - S9 - S2	3795.568m	0.018m	-0.012m	5.683
S4 - S9 - S5	3795.577m	0.020m	-0.009m	5.872

Tabla de observaciones

Las dos primeras columnas de la tabla representan los IDs de la línea base y de la solución, respectivamente, de las observaciones GPS utilizadas en el módulo. El ID de la línea base representa la combinación de dos conjuntos de datos GPS superpuestos que pueden ser procesados para formar una línea base. El ID de la solución representa una resolución real de la línea base por el procesador de líneas base. Puede haber múltiples IDs de solución para un solo ID de línea base. Esto ocurre cuando la casilla de verificación Sobrescribir soluciones duplicadas de la línea base está inhabilitada al Guardar resultados de procesamiento GPS.

Las restantes columnas son las siguientes:

De

Este campo muestra el punto de inicio de la observación.

A

Este campo muestra el punto final de la observación.

Tipo de solución

Este campo muestra el tipo de solución para la observación.

Tiempo de inicio

Este campo muestra la hora inicial de la observación.

Tabla Combinaciones pasadas para el módulo #

La tabla Combinaciones pasadas para el módulo # identifica la combinación de observaciones GPS que generaron un error de cierre menor o igual que los criterios de aceptación. La primera columna muestra las soluciones de la línea base en la combinación que pasó.

SUGERENCIA: Si hace clic en la combinación pasada, las observaciones están resaltadas en la vista de levantamiento.

El segundo conjunto de columnas es el siguiente:

Longitud

Este campo muestra la distancia total recorrida alrededor del módulo.

dHoriz

Este campo muestra el error de cierre horizontal generado por este módulo.

dVert

Este campo muestra el error de cierre vertical generado por este módulo.

Ppm

Este campo muestra el error de cierre total, horizontal y vertical, expresado en partes por millón.


Informe de módulos de cierres GPS - Detalles módulo pasado
    Informe de módulos de cierres GPS − Detalles módulo pasado

Más Información

Cómo ...	Informe	Véase también
Esta sección proporciona una información más detallada acerca de cada módulo que pasa la prueba de tolerancia de errores de cierre. Esta sección no está incluida en el informe por defecto. Esta sección se puede habilitar en el diálogo Configuraciones de módulos de cierres.

A continuación se muestra un ejemplo de esta sección del informe:

Detalles módulo pasado

Módulo S1 - S9 - S2:

De:	MOON 2
A:	WAVE		L1 fija	13:45:02 24 Feb 1999
		Pendiente:	962.407m	606819.055m
		Total:	962.407m	1828548.125m
				29.499m
A:	COWBOY		L1 fija	14:05:02 24 Feb 1999
		Pendiente:	1076.569m	607738.388m
		Total:	2038.976m	1827988.084m
				22.331m
A:	MOON 2		L1 fija	14:05:02 24 Feb 1999
		Pendiente:	1756.593m	605983.815m
		Total:	3795.569m	1828070.120m
				26.815m
Precisión:	0.50858508651573ppm
Errores	Horiz:	0.001m	Vert:	–0.002m

En la parte superior de la tabla figura una lista de las soluciones de líneas base incluidas en el módulo. Esto va seguido de la estación “de”, que es el punto a partir del cual se origina el módulo.

Esta información inicial está seguida de tres o más subsecciones, cada una compuesta por cuatro filas. Estas subsecciones contienen información sobre la estación, que se proporciona en el orden en que el programa transcurre alrededor del módulo. La primera fila de cada subsección comienza con un identificador A:. En estas subsecciones de estación se proporciona la siguiente información:

Fila 1

El identificador A: es la primera fila de una subsección de cuatro filas. La propia fila proporciona información acerca de la observación GPS. El identificador A:  va seguido del nombre del punto, listado en el orden en que se recorre el módulo. A esto sigue el tipo de observación GPS y la fecha en que de capturaron las mediciones GPS.

La información que se proporciona en esta fila corresponde a uno de los IDs de la solución que figura en la parte superior de la tabla. Se puede obtener información más detallada acerca de una solución de línea base específica examinando sus estadísticas mediante la ventana Propiedades en la Vista del levantamiento, o generando un informe de procesamiento de líneas base GPS para esa línea base.

Fila 2

El identificador Pendiente denota la segunda fila de una subsección de cuatro filas. El identificador va seguido de la distancia inclinada de la observación GPS. Esta va seguida del componente Norte de las coordenadas del punto actual “A”.

Fila 3

El identificador Total denota la tercera fila de una subsección de cuatro filas. El identificador va seguido de la distancia total recorrida hasta el momento en la construcción del módulo. Esta va seguida del componente Este de las coordenadas del punto actual “A”.

Fila 4

La última fila de la subsección no tiene identificador. Contiene la altura de las coordenadas del punto actual “A”.

NOTA: Las coordenadas Norte, Este y altura que aquí figuran no será las mismas coordenadas que se encuentran en el proyecto. Los valores que aquí se muestran se derivan añadiendo las observaciones GPS a las coordenadas de la estación inicial “De” y prolongando esta adición vectorial alrededor del módulo. Al final del módulo, las coordenadas derivadas de esta manera se substraen de las coordenadas iniciales del punto “De” para generar el error de cierre.

La última subsección de estación en esta tabla es para la estación “De”, que indica que el módulo se ha cerrado. Las dos últimas filas de la tabla proporcionan información acerca del error de cierre del módulo.

Precisión

Este campo muestra el error de cierre total, horizontal y vertical, expresado en partes por millón.

Errores

Este campo muestra los errores horizontal y vertical generados por este módulo.


    Diálogo Configuraciones de módulos de cierres GPS

Más información

 Cómo ...

Utilice este diálogo para configurar las opciones de Módulos de cierres y seleccionar las secciones incluidas en el informe de módulos de cierres GPS.

Para ver el diálogo Configuraciones de módulos de cierres GPS, use una de las siguientes alternativas:

  Seleccione Informes / Configuración / Informe de módulos de cierres GPS.

  Presione Alt+RSL.

Aparecerá el diálogo Configuraciones de módulos de cierres.

En este diálogo están incluidos los controles o grupos siguientes:

Tramos en el módulo

Edite este campo para especificar el número de observaciones utilizadas para formar los lados del módulo. El valor por efecto es de 3. Si se especifican más de 3 tramos, se generarán todos los módulos que tengan ese número de tramos, o menos. Si, por ejemplo, si especifica 5, se considerarán en el informe todos los módulos que tengan 5, 4 ó 3 lados.

Tolerancia

Edite estos campos para definir el máximo error de cierre aceptable que cumple los requisitos de precisión para el proyecto. Los errores de cierre que excedan de estas tolerancias figurarán como módulos fallidos en el informe de módulos de cierres GPS. La tolerancia se puede basar en la distancia absoluta o en una razón expresada en partes por millón.

Cuando se selecciona Absoluta, los campos Horizontal y Vertical estarán disponibles. Introduzca las tolerancias para las distancias horizontales y verticales en estos campos a fin de especificar el máximo error de cierre admisible.

Cuando se selecciona Razón el campo Ppm estará disponible. Introduzca el máximo error de cierre admisible, en ppm. Al seleccionar Razón, los errores de cierre horizontal y vertical se combinan antes de realizar la prueba de tolerancia de error de cierre.

Secciones del informe

Utilice las casillas de verificación en este grupo para seleccionar las secciones que figuran en el Informe de módulos de cierres GPS. Se pueden incluir las siguientes secciones:

  Resumen general

  Módulos fallidos

  Detalles módulo fallido

  Observaciones en módulos fallidos

  Ocupaciones en módulos fallidos

  Módulos pasados

  Detalles módulo pasado

Por defecto se incluyen las siguientes secciones:

  Resumen general

  Módulos fallidos

  Observaciones en módulos fallidos

  Ocupaciones en módulos fallidos

Se puede quitar cualquier sección del informe borrando la casilla de verificación. Otras secciones pueden incluirse en el informe seleccionando sus casillas de verificación.

Sólo usar soluciones activas

Seleccione esta casilla de verificación si solo desea incluir soluciones activas en el Informe de módulos de cierre.


    Comando Informe de módulos de cierres GPS

Cómo ...	Informe

Utilice este comando para realizar el análisis de módulos de cierres y ver los resultados con formato informe.

Para ver el Informe de módulos de cierres GPS:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

  Selección − Realiza un módulo de cierre en las líneas base seleccionadas.

  Toda base datos − Realiza un módulo de cierre en toda la bases de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y cargará el Informe de módulos de cierres GPS.


    Configurar el Informe de módulos de cierres GPS

Más información

Cómo ...	Diálogo

Seleccione este comando para elegir las secciones incluidas en el Informe de módulos de cierres GPS.

Para ver el diálogo Configurar el informe de módulos de cierres GPS, use una de las siguientes alternativas:

  Seleccione Informe / Configuración / Informe de módulos de cierres GPS.

  Presione Alt+RSL.

Se iniciará el visor HTML por defecto de la computadora y aparecerá el diálogo Configurar el Informe de módulos de cierres GPS.

NOTA: Varias secciones aparecen por defecto y se pueden añadir secciones adicionales. Se puede habilitar o inhabilitar cualquier combinación de casillas de verificación para personalizar el contenido del informe.


Diálogo Informe de módulos de cierre

Use este diálogo para seleccionar si desea hacer un informe sobre toda la base de datos o sobre módulos seleccionados.

Para ver el Informe de módulos de cierres GPS:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas

Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez que ha terminado el análisis del módulo de cierre y cargará el Informe de módulos de cierres GPS.


Para comprobar los módulos de cierres

Tras el procesamiento de las líneas base, en la ventana Vista del levantamiento, puede aparecer un indicador rojo de advertencia para marcar cada línea base que no haya pasado los criterios de aceptación de calidad. Las líneas base con indicador de advertencia pueden causar también grandes errores de cierre al realizar el análisis de los módulos de cierre.

Entre las posibles causas de error que contribuyen a cierres erróneos de mala calidad se incluyen:

  Instalación en un punto topográfico erróneo.

  Introducción de información incorrecta sobre la antena.

  Malos resultados del procesamiento.

Para comprobar un módulo de cierre:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

  Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

  Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y el informe aparece con la cabecera en la parte superior del informe.

3.	Haga clic en Resumen.

Aparecerá la sección Resumen del Informe de módulos de cierres.


Para configurar el Informe de módulos de cierres GPS

 Visión de conjunto y Más Información

La secciones del Informe de módulos de cierres GPS pueden ser habilitadas o inhabilitadas para controlar el contenido del informe. Por defecto están habilitadas estas secciones del informe:

  Resumen

  Módulos fallidos

  Observaciones en módulos fallidos

  Ocupaciones en módulos fallidos

Si se las habilita, también estarán disponibles las siguientes secciones del Informe:

  Detalles módulo fallido

  Módulos pasados

  Detalles módulo pasado

Para habilitar o inhabilitar las secciones del informe:

1.	Para ver el Informe de módulos de cierres GPS, use una de las siguientes alternativas:

  Seleccione Informe / Configurar / Informe de módulos de cierres GPS.

  Presione Alt+RSL.

Aparecerá el diálogo Configuraciones de módulos de cierres.

2.	Seleccione o borre las casillas de verificación aplicables en el grupo Secciones del informe.


Para ver el resumen del Informe de módulos de cierres GPS

 Visión de conjunto y Más información

Para ver el resumen del informe:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

  Selección – Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

  Toda base datos – Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Haga clic en Resumen.

Aparecerá la sección Resumen.


Para ver el Informe de módulos de cierres GPS

 Visión de conjunto y más información

Para ver el informe:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

  Selección – Realiza un módulo de cierre en las líneas base seleccionadas.

  Toda base datos – Realiza un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe.

3.	Use los hipervínculos del Contenido para saltar a las secciones del informe y examinar los datos.


Para ver la cabecera del Informe de módulos de cierres GPS

 Visión de conjunto y más información

Para ver la cabecera del informe:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

 Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

 Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Use las barras de desplazamiento para examinar los datos.


Para ver las estadísticas de Módulos pasados de módulos de cierres GPS

 Visión de conjunto y Más información

La sección Módulos pasados identifica qué módulos pasaron la prueba de tolerancia de errores de cierre. Esta sección de informe no aparece en el informe por defecto. Para incluir esta sección en el informe selecciónela en el diálogo Configuraciones de módulos de cierres.

Para ver las estadísticas de los módulos pasados:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

 Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

 Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Haga clic en Módulos pasados.

Aparecerá la sección Módulos pasados.


Para ver los Detalles módulo pasado de módulos de cierres GPS

 Visión de conjunto y Más información

La sección Detalles módulo pasado proporciona información más detallada acerca de los módulos que pasaron la prueba de tolerancia de errores de cierre. Esta sección de informe no aparece en el informe por defecto. Para incluir esta sección en el informe selecciónela en el diálogo Configuraciones de módulos de cierres.

Para ver las estadísticas de los módulos pasados:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

 Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

 Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Haga clic en Detalles módulo pasado.

Aparecerá la sección Detalles módulo Pasado.


Para ver los Detalles módulo fallido de módulos de cierres GPS

 Visión de conjunto y Más información

La sección Detalles módulo fallido proporciona información más detallada acerca de los módulos que no pasaron la prueba de tolerancia de errores de cierre. Esta sección de informe no aparece en el informe por defecto. Para incluir esta sección en el informe selecciónela en el diálogo Configuraciones de módulos de cierres.

Para ver los detalles de los módulos fallidos:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

 Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

 Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Haga clic en Detalles módulo fallido.

Aparecerá la sección Detalles módulo fallido.


Para ver las estadísticas de Observaciones en módulos fallidos

 Visión de conjunto y Más información

La sección Observaciones en módulos fallidos ayuda a identificar las líneas base GPS que no encajan en la red. Eso lo logra examinando todos los módulos fallidos e informando las líneas base que se encuentra en múltiples módulos fallidos. La lista se ordena de manera que las líneas base que ocurren en los módulos más fallidos se listan en la parte superior. También se incluye un resumen de estadísticas de las líneas base que puede ayudar a identificar las soluciones malas.

Para ver Observaciones en módulos fallidos:

1.	Para ver el Informe de módulos de cierres GPS, use una de las siguientes alternativas:

  Seleccione Informe / Informe de módulos de cierres.

  Presione Alt+RL.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

2.	Haga clic en Observaciones en módulos fallidos.

Aparecerá la sección Observaciones en módulos fallidos.


Para ver las estadísticas de Ocupaciones en módulos fallidos

 Visión de conjunto y Más información

La sección Ocupaciones en módulos fallidos ayuda a identificar las ocupaciones de estación GPS que no encajan en la red. Estas ocupaciones de estación pueden contener errores de configuración de la estación. Eso lo logra examinando todos los módulos fallidos, determinando las líneas base que se encuentran en múltiples módulos fallidos, e informando luego las ocupaciones que son comunes a estas líneas base. La lista se ordena de manera que las líneas base que ocurren en los módulos más fallidos se listan en la parte superior.

Para ver Ocupaciones en módulos fallidos:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

 Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

 Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Haga clic en Ocupaciones en módulos fallidos.

Aparecerá la sección Ocupaciones en módulos fallidos.


Para ver las estadísticas de Módulos fallidos

 Visión de conjunto y Más Información

Las estadísticas de Módulos fallidos identifican por qué no cerraron los tramos de un módulo de línea base.

Para ver las estadísticas de módulos fallidos:

1.	Seleccione Informe / Informe de módulos de cierres GPS. Si ha seleccionado observaciones en la ventana de gráficos, aparecerá el diálogo Informe de módulos de cierre.

2.	Seleccione una de las siguientes opciones:

 Selección − Lleva a cabo un módulo de cierre en las líneas base seleccionadas.

 Toda base datos − Lleva a cabo un módulo de cierre en toda la base de datos.

Se iniciará el visor HTML por defecto de la computadora una vez terminado el análisis del módulo de cierre y aparecerá el informe con la cabecera en la parte superior.

3.	Haga clic en Módulos fallidos.

Aparecerá la sección Módulos fallidos.


Para ver las propiedades de los indicadores de advertencia de las líneas base

 Visión de conjunto y Más información

Tras el procesamiento de las líneas base aparecerá un indicador de advertencia rojo en la ventana Gráficos para marcar cada línea base que no haya pasado los criterios de aceptación de calidad.

Para ver los detalles de los indicadores de advertencia:

1.	Seleccione una línea base.

2.	Abra la ventana Propiedades (Haga clic con el botón derecho para acceder al menú abreviado y seleccione Propiedades).

Aparecerá la ventana Propiedades.

3.	Haga clic en el icono (+) próximo a la línea base en la lista de selección de la ventana Propiedades.

El árbol de la lista Selección se expande y muestra los puntos “de” y “a” para la línea base. Un indicador rojo señala un problema en el procesamiento de la línea base.

4.	Seleccione uno de los puntos con un indicador.

5.	Use una de las siguientes alternativas:

  Haga clic en el botón Indicadores de advertencia.

  Seleccione Advertencias en el Menú Página detallado.

Un mensaje explicará por qué se ha asignado un indicador a la línea base. Utilice esta información para resolver el problema que impide que la línea base pase los criterios de aceptación. Para más información, véase Análisis del procesamiento de datos GPS.


Recálculo - Visión de conjunto
Recálculo − Visión de conjunto

El recálculo es el proceso para establecer la posición calculada de un punto.

Trimble Geomatics Office realiza un recálculo de todos los datos, es decir, todas las observaciones GPS, convencionales y de telémetros de láser y las coordenadas tecleadas o importadas para un punto. El mismo utiliza dichas observaciones y coordenadas tecleadas para determinar la posición con la calidad más elevada posible para un punto.

El recálculo:

  calcula la posición para los puntos medidos en el campo

  asigna una calidad adecuada a un punto

  detecta e informa errores de cierre en los datos

  crea un Informe de recálculo

Si un punto tiene datos topográficos redundantes, el Informe de derivación de puntos muestra la observación (u observaciones) o coordenadas tecleadas que se ha(n) utilizado para establecer la posición calculada. El Informe de recálculo muestra las observaciones redundantes que están fuera de tolerancia. Las tolerancias están definidas en la Ficha Recalcular del diálogo Propiedades proyecto.

Se requiere un recálculo cada vez que se añaden datos al proyecto o si se editan datos existentes, por ejemplo si cambia una altura de antena para una observación GPS.

Sin embargo, Trimble Geomatics Office no realiza un recálculo automáticamente. Cuando se necesita un recálculo, aparecerá el icono Recalcular [image] en la barra de estado de Trimble Geomatics Office.

Para recalcular, realice una de las siguientes acciones:

  Seleccione Levantamiento / Recalcular.

  Presione F4.

  En la barra de estado, haga doble clic en el icono Recalcular (si está disponible).

  Haga clic con el botón derecho del ratón para acceder al menú abreviado y seleccione Recalcular.

NOTA: Se puede realizar un recálculo en cualquier momento, sin embargo, si el icono Recalcular no se muestra primero en la barra de estado, nada cambiará.

El recálculo no:

  distribuye errores

  usará coordenadas tecleadas de calidad topográfica, de control o ajustadas en lugar de observaciones

NOTA: El término coordenadas tecleadas se refiere a las coordenadas para un punto que se teclean utilizando Trimble Geomatics Office o que se importan de un archivo de datos al proyecto de Trimble Geomatics Office.


Recálculo - Cómo se determina la posición calculada para puntos observados
Recálculo − Cómo se determina la posición calculada para puntos observados

 Visión de conjunto y más información

El gráfico muestra cómo el recálculo encuentra la posición calculada para puntos observados en el campo.

NOTA: Al determinar la posición calculada para un punto observado, el recálculo no usa observaciones inhabilitadas o coordenadas tecleadas inhabilitadas. Sólo utiliza observaciones o coordenadas tecleadas que están habilitadas como una comprobación si las posiciones de puntos en el proyecto no se pueden determinar a través de otras observaciones o coordenadas. Para habilitar o inhabilitar observaciones, utilice la ventana Propiedades.

Dichos temas describen los cuadros en el gráfico:

  Cómo el recálculo determina puntos iniciales potenciales

  Cómo el recálculo determina la posición para todos los puntos iniciales potenciales

  Recálculo − Cómo las calidades del componente determinan el punto inicial actual

  Recálculo − Cómo se aplican las observaciones del punto inicial actual

  Recálculo − Cómo se determina la calidad de puntos observados


Recálculo - Cómo se determinan puntos iniciales potenciales
Recálculo − Cómo se determinan puntos iniciales potenciales

 Visión de conjunto y más información

Un recálculo puede comenzar con cualquier punto que tenga las siguientes características:

  Coordenadas tecleadas y

  Una o más observaciones desde el punto

Por ejemplo, la siguiente figura muestra una base Cinemática en tiempo real (RTK). Este es un punto inicial potencial.


Recálculo - Cómo se determina la posición para todos los puntos iniciales potenciales
Recálculo − Cómo se determina la posición para todos los puntos iniciales potenciales

 Visión de conjunto y más información

La posición del punto inicial se determina de la coordenada tecleada. Un punto inicial potencial por lo general tiene sólo un conjunto de coordenadas tecleadas. La calidad de cada componente de posición (NE, e, a) se hereda de la calidad de la coordenada tecleada. Si el componente elevación o altura no se ha tecleado, entonces se utiliza el modelo geoidal para derivar el componente que falta.

Un punto puede tener más de un conjunto de coordenadas tecleadas si:

  se teclean coordenadas para un punto y se realiza un ajuste (si tiene el módulo Network Adjustment [Ajuste de la red instalado]) sin mantener el punto fijo (ello crea un conjunto de coordenadas ajustadas para el punto)

  se importan coordenadas WGS-84 y coordenadas de cuadrícula para un punto

  se importan coordenadas WGS-84 y una elevación. Una elevación se almacenará como parte de una coordenada de cuadrícula.

En este caso, un recálculo utiliza ciertos criterios para determinar qué coordenada utilizar como la posición calculada. Si no puede encontrar un solo conjunto de coordenadas utilizando el primer criterio, aplicará el siguiente. Los criterios, en orden, son los siguientes:

1.	El estado (habilitado/inhabilitado) de las coordenadas.

2.	El componente de más alta calidad.

3.	Se usan coordenadas WGS-84 en lugar de coordenadas de la cuadrícula.


Recálculo - Cómo se determina la posición para todos los puntos iniciales potenciales: (1) El estado de las coordenadas
Recálculo − Cómo se determina la posición para todos los puntos iniciales potenciales: (1) El estado de las coordenadas

 Véase también

El estado (habilitado/inhabilitado) de la coordenadas

Sólo se considerarán las coordenadas habilitadas al determinar la posición de puntos iniciales. Las coordenadas de comprobación se utilizan únicamente para determinar la posición de puntos iniciales si las observaciones no se usan para coordinar el punto.

NOTA: Las coordenadas de comprobación rara vez se utilizan para coordinar puntos iniciales.

Las coordenadas inhabilitadas jamás se tienen en cuenta. Para habilitar e inhabilitar coordenadas, utilice la ventana Propiedades o el diálogo Edición múltiple.

El componente de más alta calidad

Si hay más de un conjunto de coordenadas habilitado, el recálculo toma en cuenta los componentes de más alta calidad de todas las coordenadas tecleadas disponibles para el punto. Los tres componentes son:

  horizontal

  elevación

  altura

NOTA: Dichos componentes no tienen que proceder del mismo grupo de coordenadas.

La siguiente tabla muestra las calidades de los tres componentes y las clasifica de más alta a más baja. El orden de las calidades se conoce como ‘jerarquía de calidad’.

En la ventana Propiedades, el símbolo de la calidad aparecerá junto a cada componente.

Tipo de coordenada

Si las dos coordenadas tienen la misma calidad, un recálculo elegirá del tipo de coordenada. Las coordenadas WGS-84 se utilizan antes que las coordenadas de cuadrícula/locales.


Recálculo - Cómo las calidades del componente determinan el punto inicial actual
Recálculo − Cómo las calidades del componente determinan el punto inicial actual

 Visión de conjunto y más información

Si hay más de un punto inicial potencial, un recálculo elige el punto de más alta calidad como el punto inicial actual. El mismo utiliza la siguiente jerarquía:

1.	Control

2.	Ajustada

3.	Topográfica

4.	Cartográfica

5.	Desconocida

Se toma en cuenta la calidad de cada componente. Si la calidad para la posición del punto es diferente para cada componente, la calidad horizontal se toma en cuenta primero, luego la altura y después la elevación.

La siguiente tabla muestra parte de la jerarquía de calidad que determina el punto inicial potencial que se convertirá en el punto inicial actual (la jerarquía de calidad se extiende más de lo que se muestra en la tabla)). Las celdas sombreadas indican las calidades preferidas por un recálculo:

Por ejemplo, un punto puede tener las siguientes calidades de componente:

  Calidad horizontal − control

  Calidad altura − desconocida

  Calidad elevación − desconocida

Por lo tanto se usa como un punto inicial antes que un punto con las siguientes calidades de componentes:

  Calidad horizontal − topográfica

  Calidad altura − topográfica

  Calidad elevación − cartográfica

Asegúrese de que el punto que desea utilizar como un punto inicial o coordenadas de siembra tenga componentes con calidad control.

NOTA: Si hay más de un punto inicial potencial con las mismas calidades para todos los componentes, un recálculo utiliza el primer punto en el proyecto.


Recálculo - Cómo se aplican las observaciones del punto inicial actual
Recálculo − Cómo se aplican las observaciones del punto inicial actual

 Visión de conjunto y más información

Un recálculo aplica una observación de un punto inicial de distintas formas según el tipo de observación. El mismo aplicará:

  Observaciones GPS en el elipsoide WGS-84.

  Observaciones convencionales y de telémetros de láser en el elipsoide local, a menos que no esté seleccionada la opción Reducir observaciones terrestres a elipsoide (corrección del Nivel medio del mar).

Esta opción está ubicada en la Ficha Recalcular del diálogo Propiedades proyecto. En este caso, un recálculo aplica observaciones terrestres a nivel del terreno. Consulte más información en el tema Corrección del nivel elipsoidal. Si se realiza un ajuste, todas las distancias se reducirán al elipsoide.

  Incrementos elevación − se aplican a las elevaciones existentes en un recálculo inicial.


Recálculo - Cómo se aplican las observaciones GPS
Recálculo − Cómo se aplican las observaciones GPS

 Visión de conjunto y más información

Las observaciones GPS están almacenadas en el proyecto de Trimble Geomatics Office como vectores terreno-a-terreno. Sin embargo, los vectores GPS se observan del centro de fase de la antena al centro de fase de la antena (CFA-CFA) en el campo.

Durante la importación, Trimble Geomatics Office convierte los vectores GPS a vectores terreno-a-terreno utilizando las alturas de antena de las antenas GPS en cada extremo de la línea base. Si se editan la alturas de antena, el vector terreno-a-terreno se actualizará automáticamente.

NOTA: El procesador de la línea base genera vectores terreno-a-terreno.

Un recálculo realiza las siguientes acciones para determinar la posición para puntos observados utilizando el GPS:

1.	Convierte las coordenadas del punto inicial actual a latitud, longitud y altura (L,L,a) WGS-84.

2.	Convierte dichas coordenadas a coordenadas cartesianas (X, Y, Z) WGS-84.

3.	Aplica el vector GPS terreno-a-terreno (incremento X, incremento Y, incremento Z) a coordenadas cartesianas WGS-84 del punto inicial. Esto suministra una posición WGS-84 para el punto observado.

NOTA: El vector GPS aplicado es un vector ajustado si se usan los parámetros de red ajustados en el proyecto, aun si la línea base no fue utilizada en el ajuste de red.

4.	Convierte el punto observado a latitud, longitud y altura WGS-84.

5.	Usa el sistema de coordenadas seleccionado para el proyecto para derivar las coordenadas de proyección para cada punto de la posición WGS-84. También utiliza la Calibración local GPS aplicada al proyecto.

6.	La coordenada resultante será la posición del punto actual.


Recálculo - Dirección de las líneas base GPS
Recálculo − Dirección de las líneas base GPS

 Visión de conjunto y más información

Por defecto, un recálculo aplica todas las observaciones GPS cinemáticas en tiempo real (RTK) en la dirección en que se ha observado el vector (base a móvil).

La dirección de líneas base estáticas y estáticas rápidas con posprocesamiento se determinan por siembra (seeding) de observaciones durante el procesamiento de líneas base. La dirección se almacena en el proyecto y se mostrará una flecha en la línea base en la ventana de gráficos. El algoritmo de siembra asegura que los vectores se procesen del punto con la posición de más alta calidad al punto con la posición de más baja calidad. Un recálculo aplica el vector en la dirección en que está almacenado en el proyecto.

Se puede cambiar la dirección de un vector GPS para que un recálculo aplique el vector en dirección opuesta.

Para hacerlo, seleccione la observación y seleccione Editar / Invertir flujo de observaciones. En este caso, asegúrese de que el punto del que desea que fluya el punto tenga una posición conocida, por ejemplo, coordenadas con latitud, longitud y altura WGS-84 tecleadas. Si el punto no tiene una posición conocida, la observación no se aplica.


Recálculo - Cómo se aplican las observaciones convencionales y de telémetros de láser
Recálculo − Cómo se aplican las observaciones convencionales y de telémetros de láser

 Visión de conjunto y más información

Cuando se importan observaciones convencionales:

  se corrige la curvatura y refracción en los ángulos verticales

  se corrigen los errores atmosféricos (corrección ppm) en la distancia inclinada

  las observaciones horizontales se convierten a ángulos horizontales de la referencia.

Un recálculo realiza las siguientes acciones para determinar la posición de puntos observados convencionalmente o con un telémetro de láser:

1.	Se realiza una de las siguientes acciones:

  Si la observación es una observación de telémetro de láser, un recálculo aplica la declinación magnética al acimut observado.

  Si la observación es una observación convencional, un recálculo aplica la constante del prisma a la distancia inclinada.

2.	Reduce las distancias inclinadas observadas a distancias del terreno horizontales.

3.	Si se selecciona la opción Reducir observaciones terrestres a elipsoide  (corrección del Nivel medio del mar) en la Ficha Recalcular del diálogo Propiedades proyecto, reducirá las distancias terrestres a distancias elipsoidales.

4.	Añade la altura de instrumento a la altura local.

5.	Utiliza el sistema de coordenadas definido para el proyecto a fin de convertir el punto inicial actual a la latitud, longitud y altura local (la observación se aplica junto al elipsoide).

6.	Utiliza las siguientes normas para determinar el acimut de referencia (sólo para observaciones convencionales).

 Si sólo se conoce la posición del punto del instrumento y del punto de referencia (es decir, no hay un acimut tecleado), el recálculo utiliza el acimut de referencia determinado del inverso entre los dos puntos.

  Si sólo hay un acimut tecleado disponible y el punto “a” no tiene una coordenada, el recálculo lo usará como el acimut de referencia.

  Si se conocen ambas posiciones del punto del instrumento y del punto de referencia, y hay un acimut tecleado disponible, el recálculo determinará la calidad de cada acimut y usa la jerarquía de la tabla de más adelante para determinar el acimut a utilizar como el acimut de referencia.

Por ejemplo, si existe un par de puntos de referencia y del instrumento de calidad topográfica, junto con un acimut tecleado de calidad de control, se usará el acimut tecleado para el acimut de referencia.

NOTA: Para calcular la calidad del acimut de referencia, se examinará la calidad horizontal del punto del instrumento y el punto de referencia y se tomará la calidad más baja. Por ejemplo, si el punto del instrumento tiene una calidad de control y el punto de referencia tiene una calidad topográfica, el acimut de referencia tendrá una calidad cartográfica.

Tipo	Calidad
Derivado de coordenadas	Control
Acimut tecleado	Control
Derivado de coordenadas	Topográfica
Acimut tecleado	Topográfica
Derivado de coordenadas	Cartográfica
Acimut tecleado	Cartográfica
NOTA: Si quiere que un recálculo use preferentemente el acimut tecleado en lugar del determinado entre el punto de referencia y del instrumento, incremente la calidad de la posición del acimut tecleado para que sea más alta en la jerarquía que el acimut determinado entre el punto de referencia y del instrumento.

SUGERENCIA: La calidad del acimut tecleado se podrá editar.

7.	Aplica el ángulo horizontal al acimut de referencia para determinar el acimut de la cuadrícula (sólo para observaciones convencionales).

8.	Aplica la declinación magnética al acimut magnético para determinar el acimut de la cuadrícula (sólo para observaciones láser).

9.	Aplica la observación junto al elipsoide para determinar una latitud y longitud local para el punto observado.

10.	Para determinar la elevación para el punto observado, resta la altura del destino de la altura del instrumento a fin de encontrar el incremento de altura. Luego lo añade a la elevación del punto de configuración del instrumento.

Utiliza el sistema de coordenadas seleccionado para el proyecto para convertir las coordenadas a coordenadas de la cuadrícula local.


Recálculo - Cómo se aplican los incrementos de elevación
Recálculo − Cómo se aplican los incrementos de elevación

Los Incrementos elevación se aplican durante un recálculo que realiza las siguientes acciones para que fluyan los incrementos de elevación:

  Se determina la elevación del punto inicial.

  Se aplica el incremento de elevación al punto inicial para determinar la elevación del nuevo punto.

En un recálculo, el punto inicial debe tener una elevación tecleada para que los incrementos de elevación fluyan del mismo.

Se deberá introducir una elevación al inicio de la serie de nivel para asegurarse de que los incrementos de elevación pueden fluir del inicio de la serie de nivel.

Por ejemplo, en el siguiente diagrama, el Punto A debe tener una elevación tecleada para las elevaciones de los puntos B, C y D a determinarse utilizando las observaciones de los incrementos de elevación. Si una observación a A tenía suficiente información para calcular una elevación en A, los incrementos de elevación todavía no se hubieran calculado (a menos que tuviera una elevación tecleada).


Recálculo - Ejemplo
Recálculo − Ejemplo

 Visión de conjunto y más información

La siguiente figura es un ejemplo de cómo un recálculo coordina puntos. Los puntos A e I son ambos puntos con calidad Control, los otros puntos son de calidad Topográfica.

Un recálculo estable los puntos A e I como puntos iniciales potenciales puesto que los dos puntos tienen coordenadas tecleadas y observaciones que fluyen de los mismos. Los puntos A e I son de la misma calidad (control L,L,a), por lo tanto un recálculo elige el punto A como el punto inicial actual porque se lo ha introducido primero en el proyecto.

Un recálculo utiliza todas las observaciones del punto inicial para coordinar los puntos observados hasta llegar a un límite. Por lo tanto, los siguientes puntos se coordinan desde el punto A: B, C, D, E, F, G y H.

No hay más observaciones del punto inicial actual (punto A), por ende un recálculo elige el punto I como el nuevo punto inicial actual y coordina los puntos J, K y L desde el punto I.

Hay observaciones desde el punto I a los puntos D y H. Un recálculo ya ha coordinado dichos puntos, en consecuencia se muestra un cierre para los mismos. Si el cierre es mayor que las configuraciones de tolerancia en la Ficha Recalcular del diálogo Propiedades proyecto, aparecerá un indicador de advertencia en el punto observado en la ventana gráfica. El cierre se informará en el Informe de recálculo.

ADVERTENCIA: El punto D puede derivarse de observaciones de B e I. La observación de B se utiliza sin tener en cuenta la calidad de dichas observaciones. Esto se debe a que D se coordina primero desde B. Si desea asegurarse de que se utiliza la observación de I, cambie el estado de la observación de B a D a “habilitada como comprobación”.


Recálculo - Observaciones múltiples y coordenadas para un punto
Recálculo − Observaciones múltiples y coordenadas para un punto

Visión de conjunto y más información

Un punto puede tener múltiples observaciones y coordenadas tecleadas. Si está seleccionada la opción Usar la mejor observación en la Ficha Recalcular del diálogo Propiedades proyecto, sólo se puede usar una observación o coordenadas para derivar un componente de posición (NE,e,a) para el punto. Por ejemplo, un punto puede tener dos observaciones al mismo y una coordenada tecleada. Las coordenadas tecleadas se usan para coordinar el punto, en lugar de la observación. Las otras observaciones o coordenadas tecleadas que el recálculo no utiliza se informan en el Informe de recálculo.

NOTA: Si está seleccionada la opción Calcular la media del mismo tipo de observaciones (en la Ficha Recalcular del diálogo Propiedades proyecto), todas las observaciones pueden contribuir al cálculo de los componentes de coordenadas del punto de toma aislada. Sólo se hace la media de los puntos de tomas aisladas.

Observaciones múltiples a un punto

Para determinar las coordenadas calculadas para un punto con observaciones múltiples (cuando la opción Usar mejor observación está seleccionada), el recálculo utiliza la siguiente jerarquía de observación:

1.	Estado de observación (habilitada, habilitada como comprobación, inhabilitada)

2.	Calidad de observación

3.	Tipo de observación (GPS, convencional, láser, reducida)

4.	Precisión

5.	Primera observación en el proyecto


Recálculo - Observaciones múltiples a puntos de toma aislada
Recálculo − Observaciones múltiples a puntos de toma aislada

 Visión de conjunto y más información

Cuando las observaciones (GPS o convencionales) se transfieren a Trimble Geomatics Office, el software determina si cada observación es una toma aislada. Una toma aislada es una observación a un punto que:

  no tiene una observación al mismo

  no tiene una observación estática o EstáticaRápida al mismo

  no es un punto de control

La siguiente figura muestra cómo los puntos de toma aislada pueden ocurrir en dos situaciones diferentes.

La configuración en el grupo Observaciones de tomas aisladas múltiples (en la Ficha Recalcular del diálogo Propiedades proyecto) determina las observaciones que se utilizan para calcular la posición del punto de toma aislada.

NOTA: Un recálculo no hace la media de elevaciones a partir de varias tomas aisladas.


Recálculo -Observaciones múltiples y media de coordenadas
Recálculo − Observaciones múltiples y media de coordenadas

 Visión de conjunto y más información

Por defecto, la opción Calcular la media del mismo tipo de observaciones en la Ficha Recalcular del diálogo Propiedades proyecto no está seleccionada. Como resultado, las observaciones múltiples no se promedian.

Si selecciona esta opción, Trimble Geomatics Office promedia las coordenadas de cada observación a un punto de toma aislada.

NOTA: Si el punto es un punto poligonal, un recálculo sólo utiliza una observación o coordenada para determinar la posición del punto.

Las normas para promediar la posición para los puntos de toma aislada son:

  Un recálculo sólo promedia el mismo tipo de observación. Por ejemplo, una observación GPS no se puede promediar con una observación convencional. En este caso, un recálculo utiliza la observación GPS antes que la observación convencional.

  Un recálculo sólo hace la media de coordenadas derivadas de observaciones. Por ejemplo, si un punto tiene dos observaciones y coordenadas tecleadas, un recálculo promedia las observaciones y determina las coordenadas y calidades. Luego compara las coordenadas tecleadas y las promediadas y utiliza la coordenada de más alta calidad como la posición para el punto.

NOTA: Si hay una o más observaciones habilitadas, un recálculo no utiliza observaciones habilitadas como comprobación para determinar una posición media.

A fin de determinar la posición calculada para el punto, un recálculo calcula posiciones de cada observación al punto. Cada observación se pondera según el valor de precisión. Cuanto más precisa, más influencia tendrá la observación en los valores medios de coordenadas.

Para observaciones GPS, un recálculo utiliza el campo Precisión. Para ver este campo:

1.	Seleccione una observación GPS.

2.	Abra la ventana Propiedades.

3.	Haga clic en el botón de menú Estadísticas observación [image].

Para las observaciones convencionales, se utiliza una ponderación equivalente.

Un recálculo utiliza la posición media como el centro de un círculo con un radio definido por la distancia de tolerancia. Dicha distancia está especificada en la Ficha Recalcular del diálogo Propiedades proyecto. Si el componente de coordenada es horizontal (Norte, Este), un recálculo emplea la Tolerancia  horizontal. Si el componente de coordenada es vertical (Elevación o Altura), utiliza la Tolerancia vertical.

Si las posiciones están fuera del círculo definido por la tolerancia, se rechazará la posición más alejada de la posición media y el proceso se repite. En la siguiente figura, un punto de toma aislada tiene tres observaciones convencionales al mismo.

La observación 3 está fuera del círculo de tolerancia, por lo tanto se lo omite para la próxima iteración.

El proceso se repite con las observaciones restantes hasta que todas las posiciones calculadas estén dentro del círculo de tolerancia. La siguiente figura muestra cómo las coordenadas de la cuadrícula medias calculadas se convierten en las coordenadas calculadas finales para el punto.

Todas las observaciones utilizadas para determinar las coordenadas medias están ahora dentro de la tolerancia especificada, en consecuencia un recálculo las emplea para la posición calculada para el punto.

NOTA: Si inhabilita la casilla de verificación Usar comprobación de tolerancia en la ficha Recalcular del diálogo Propiedades proyecto, se hace la media de todas las observaciones del mismo tipo sin comprobar la tolerancia. Como resultado, no se detectarán los periféricos.


Recálculo - Observaciones múltiples a puntos poligonal
Recálculo − Observaciones múltiples a puntos poligonal

 Visión de conjunto y más información

En una poligonal topográfica, un punto poligonal puede tener más de una observación al mismo. Ello se conoce como una observación múltiple.

Las observaciones múltiples a puntos poligonal no se promedian. Esto se muestra en la siguiente figura. El punto 1 tiene dos observaciones al mismo y una observación a partir del mismo. La observación utilizada para derivar la posición del Punto 1 es la primera en colocar el punto.


Recálculo - Puntos con coordenadas tecleadas y observaciones
Recálculo − Puntos con coordenadas tecleadas y observaciones

 Visión de conjunto y más información

La posición que se muestra puede derivar de:

  observación(es)

  coordenada(s) tecleada(s), por ejemplo, coordenadas de la cuadrícula importadas

Si un punto tiene coordenadas tecleadas y observaciones al mismo, un recálculo usa la calidad de la(s) coordenada(s) tecleada(s) y observación(es) para determinar la posición para el punto. Si las calidades son las mismas, utilizará las coordenadas tecleadas antes que las coordenadas de la observación (u observaciones). Por lo tanto, si desea utilizar observaciones para la posición de un punto, asegúrese de seleccionar calidades más altas para la observación que para las coordenadas tecleadas al punto.

Un recálculo considera la calidad del componente horizontal y vertical de forma independiente. Por ejemplo, las coordenadas de la cuadrícula importadas para un punto pueden tener un componente horizontal de calidad Topográfica (Norte, Este) y un componente elevación de calidad Cartográfica. También hay una observación al punto. Las coordenadas horizontal y vertical derivadas de la observación son de calidad Topográfica.

Esto se resume en la siguiente tabla.

Las celdas sombreadas muestran cómo se determina la posición para el punto. Las calidades del componente horizontal son las mismas, por lo tanto un recálculo usa las coordenadas antes que la observación. El componente vertical de la coordenada importada es más bajo que la observación, en consecuencia un recálculo deriva la elevación de la observación.

La mejor elevación o altura para puntos se deriva utilizando las coordenadas tecleadas disponibles y las observaciones al punto. Si un recálculo emplea una observación para calcular una elevación o altura para el punto, el mismo calcula los componentes verticales restantes a partir de una de las siguientes opciones:

  El modelo geoidal y/o ajuste vertical

  Coordenadas tecleadas

Si se usa un modelo geoidal para el proyecto, la calidad del mismo en la ficha Recalcular del diálogo Propiedades proyecto se emplea para determinar la calidad de la elevación o altura derivada del modelo geoidal. Dicha calidad se compara con coordenadas tecleadas y se utiliza el componente elevación o altura de mejor calidad.

NOTA: Si existe un ajuste vertical de una calibración en la definición del sistema de coordenadas del proyecto, la calidad de la elevación o altura derivada será Topográfica.


Recálculo - Cómo se determina la calidad de puntos observados
Recálculo − Cómo se determina la calidad de puntos observados

 Visión de conjunto y más información

Un recálculo determina la calidad de un punto observado a partir de la calidad del punto desde el que se ha observado y la calidad de la observación empleada para derivar la posición para el punto. El mismo considera los componentes horizontal y vertical independientemente.

La jerarquía de calidad es:

1.	Control

2.	Topográfica

3.	Cartográfica

4.	Desconocida

La siguiente tabla muestra cómo de determinan las calidades de observación a partir del tipo de solución o medición.

Tipo de observación	Calidad asignada a la observación
GPS fija	Topográfica
GPS flotante	Cartográfica
GPS autónoma	Desconocida
Convencional	Topográfica
Telémetro de láser	Cartográfica
Incremento elevación	Topográfica
La calidad asignada al punto para cada componente ( (horizontal, elevación y altura) es la más baja de:

  la calidad para el punto desde el que se ha realizado la observación

  la calidad de la observación


Posición base autónoma para levantamientos cinemáticos en tiempo real

 Visión de conjunto y más información

Si utiliza la tecla [image] en Trimble Survey Controller para iniciar una base cinemática en tiempo real (RTK) y transferir el archivo Survey Controller (.dc) a Trimble Geomatics Office, la posición de la estación base (y por lo tanto todos los puntos móvil de la base) son de calidad desconocida (para todos los componentes, horizontal, altura y elevación).

Si usa Trimble Geomatics Office para realizar una calibración local GPS, la calidad de los componentes horizontal y altura no se cambiarán.

Si está seguro de que la calibración local GPS ha mejorado la calidad de los puntos, use la ventana Propiedades para cambiar la calidad del punto base. Al incrementar la calidad de la base, la calidad de los puntos móvil mejorará.

NOTA: La calidad del componente elevación será topográfica si existe un ajuste vertical en la definición del sistema de coordenadas del proyecto.


Recálculo - Puntos que han sido movidos o ajustados utilizando Trimble Geomatics Office

 Visión de conjunto y más información

Un recálculo no mueve puntos que han sido desplazados por:

  el movimiento de una coordenada.

  una transformación de coordenadas

  una ajuste de elevación.

  un ajuste de la red.

Cuando se aplica una de dichas operaciones a un punto, no se utilizarán las posiciones derivadas de las observaciones al punto


Recálculo - Altura proyecto
Recálculo − Altura proyecto

 Visión de conjunto y más información

La altura del proyecto es una configuración de todo el proyecto que se utiliza como una altura aproximada para los cálculos de puntos sin altura. Los puntos que no tienen alturas no se actualizan con el valor de altura del proyecto. Sólo se emplea para convertir coordenadas cuando:

  se cambia el sistema de coordenadas del proyecto y hay alturas nulas

  se aplican correcciones del nivel del mar puesto que no hay alturas para los puntos

El campo Altura proyecto está en la Ficha Sistema de coordenadas del diálogo Propiedades proyecto.


Recálculo - Comprobar observaciones
Recálculo − Comprobar observaciones

 Visión de conjunto y más información

Trimble Survey Controller le permite almacenar observaciones de comprobación a puntos. Las siguientes secciones describen cómo se manejan dichos puntos cuando se importa un archivo .dc a Trimble Geomatics Office.

Puntos de comprobación para puntos que no son puntos de control tecleados

Cuando se importa el archivo .dc, la posición calculada para el punto añadido se deriva utilizando una observación(es) habilitada(s) al punto. Se importará la observación de comprobación pero no se la utilizará para determinar la posición calculada del punto a menos que no haya observaciones al punto con un estado Habilitada (un recálculo siempre usa observaciones Habilitadas antes que observaciones Habilitadas como comprobación. A la observación se le asigna un estado de Habilitada como comprobación y se muestra como un línea de puntos en la ventana gráfica. Para ver y editar el estado de una observación, utilice la página Resumen de la ventana Propiedades. Se calcula un error de cierre entre la posición calculada para el punto y las coordenadas determinadas por la observación de comprobación. Ello se informa en el Informe de recálculo que se genera durante la importación y se coloca en la carpeta Recalcular dentro de la carpeta de Informes del proyecto.

NOTA: Si almacena una observación de comprobación a un punto almacenado, luego elimina el punto capturado anteriormente, se importará la observación de comprobación y se añadirá un nuevo punto. El Estado de la observación se mantendrá como Habilitada como comprobación y la posición calculada para el punto se deriva de la observación.


Trimble 3600/5600 GDM - Visión de conjunto

Se podrán transferir datos entre Trimble Geomatics Office y una unidad de control Trimble 3600/5600 GDM en un instrumento Trimble 3600/5600. Trimble recomienda que el instrumento tenga el firmware 632.11.00 ó posterior.

Podrá importar datos de archivos de trabajo de 3600/5600 GDM (*.job) y archivos de área (*.are), y exportar datos del proyecto actual de Trimble Geomatics Office a un archivo de área (*.are). Alternativamente,  importe o exporte datos directamente utilizando la opción para importar Dispositivos topográficos.

La siguiente tabla muestra los tipos de archivo que se pueden transferir entre Trimble Geomatics Office y una unidad de control Trimble 3600/5600 GDM:

Importar	Exportar
.job : datos capturados de la unidad de control Trimble 3600/5600 GDM	Ninguno
.are:  archivo de coordenadas	.are
Ninguno	.pco : a la unidad de control Trimble 3600/5600 GDM
Ninguno	.uds : una secuencia definida por el usuario
Para asegurarse de que Trimble Geomatics Office puede interpretar correctamente archivos de 3600/5600 GDM importados, haga lo siguiente:

  	Asegúrese de que la unidad de control Trimble 3600/5600 GDM tenga el número de programa activado.

  	Configure Program 32 (Programa 32) para almacenar la distancia inclinada en lugar de la distancia horizontal y vertical. Consulte más información en la documentación de la unidad de control Trimble 3600/5600 GDM.

  	Para mostrar las observaciones de Program 23 y 24 en Trimble Geomatics Office, las tablas de usuario de Trimble 3600/5600 GDM deben incluir registros de ángulo horizontal, de ángulo vertical y de distancia inclinada a continuación de los registros estándares. Consulte más información sobre cómo modificar las tablas de usuario en la documentación de la unidad de control Trimble 3600/5600 GDM.


Secuencia definidas por el usuario (UDS) - Visión de conjunto

Una secuencia definida por el usuario determina cómo los datos topográficos se capturarán y almacenarán en el campo, utilizando una unidad de control Trimble 3600/5600 GDM en un instrumento Trimble 3600/5600. Cada secuencia se almacena en un archivo de secuencia definida por el usuario (*.uds).

Los archivos UDS deben comprender los siguientes registros:

2	Estación del instrumento
3	Altura del instrumento	(Opcional)
62	Punto de la visual hacia referencia
21	Acimut de referencia
5	Nombre de punto
6	Altura del objetivo	(Opcional)
4	Código	(Opcional)
7	Angulo horizontal
8	Angulo vertical
9	Distancia inclinada

Para emplear una secuencia definida por el usuario en el campo, transfiera un archivo UDS a la unidad de control Trimble 3600/5600 GDM utilizando la utilidad independiente Data Transfer (Transferencia de datos). (No podrá usar el diálogo Exportar de Trimble Geomatics Office.) Consulte más información en la ayuda de Data Transfer.

Una vez que ha capturado y almacenado los datos topográficos, transfiéralos a Trimble Geomatics Office.

NOTA: Los archivos UDS predefinidos están disponibles en el CD de Trimble Geomatics Office.

Véase también


Archivos Pcode (*.pco)

Los archivos Pcode contienen códigos numéricos y descripciones alfanuméricas que definen características y atributos. Se utilizan en una unidad de control Trimble 3600/5600 GDM en un instrumento Trimble 3600/5600. Podrá introducir los códigos mientras captura datos en el campo para definir los puntos observados. Por ejemplo, si un archivo Pcode contiene un código “201” y una descripción “Arbol”, en el campo podrá introducir “201”, y se mostrará “Arbol” en la unidad de control.

Un archivo Pcode exportado a una unidad de control Trimble 3600/5600 GDM deberá tener lo siguiente:

  Códigos numéricos con un número inferior a 256

  Descripciones que, todas juntas, tengan menos de 800 caracteres

Para utilizar un archivo Pcode, cree uno de una biblioteca de características y atributos en la utilidad Feature and Attribute Editor de Trimble y luego transfiéralo a la unidad de control.

Véase también


Archivos de área (*.are)

Trimble Geomatics Office soporta datos de área de una unidad de control Trimble 3600/5600 GDM (archivos *.are).

Para obtener más información, véase :

  Importación de archivos de la UC Trimble 3600/5600 GDM, cómo

  Exportación a un formato de la UC Trimble 3600/5600 GDM, cómo


Archivos de trabajo (*.job)

Trimble Geomatics Office soporta datos de trabajo de una unidad de control Trimble 3600/5600 GDM (archivos *.job).

Véase más información en Importación de archivos de la UC Trimble 3600/5600 GDM, cómo