Copyright: © 1999-2001 Trimble Navigation Limited
Citation: © 1999-2001 Trimble Navigation Limited


    Ajustement de réseau - Contenu

Les rubriques suivantes sont disponibles :

  Ajustement de réseau

  Datum d’ajustement

  Styles d’ajustement de réseau

  Points

  Observations

  Groupes d’observation

  Stratégies de pondération

  Ajuster

  Coordonnées de calibration

  Supprimer ajustement

  Rapport d’ajustement de réseau

Pour apprendre comment utiliser l’Aide, appuyez sur la touche F1.

Si vous rencontrez un problème et que ne pouvez pas trouver les informations dont vous avez besoin dans ce système d’Aide, référez-vous au Manuel de l’utilisateur de l’ajustement de réseau Trimble Geomatics Office, contactez votre distributeur local ou référez-vous à Support technique.

©1999−2002, Trimble Navigation Limited. Tous droits réservés.


    Ajustement de réseau - Vue d'ensemble

Plus amples informations

 Voir aussi

Vue d'ensemble

Le but d’un ajustement par la méthode des moindres carrés pour votre réseau est :

  d’estimer et supprimer des erreurs aléatoires

  de procurer une solution unique lorsque des données redondantes sont présentes

  de minimiser les corrections effectuées sur les observations

  de détecter les bévues et les grosses erreurs

  de générer des informations à des fins d’analyse, y compris estimations de précision

Après avoir réussi un ajustement par la méthode des moindres carrés, vous êtes en mesure de déterminer :

  qu’il n’existe ni bévues ni erreurs systématiques dans les observations et les points de contrôle

  que toutes les erreurs restantes sont petites, aléatoires et correctement distribuées

Un ajustement par la méthode des moindres carrés assure de bonnes fermetures de position et estimations de répétabilité, garantissant ainsi la fiabilité des mesures courantes et futures.

Pour effectuer un ajustement réussi, un réseau de moindres carrés doit satisfaire aux critères suivants :

  Le réseau doit fermer géométriquement et mathématiquement.

  La somme des carrés pondérés des résidus doit être minimisée.

Fermer le réseau géométriquement signifie simplement concevoir votre réseau à l’aide d’une bonne géométrie stable. Un réseau GPS ou terrestre se compose d’une série d’observations entre les points du réseau. Ces observations créent des figures géométriques fermées telles que des triangles.

Fermer le réseau mathématiquement signifie simplement que vous avez éliminé toutes les grosses erreurs ou bévues des observations, garantissant ainsi des résultats statistiques acceptables.

Maintenir les carrés pondérés à un minimum se réfère à fermer le réseau mathématiquement en ce sens que vous devez minimiser la somme des carrés pondérés des résidus de vos observations. En termes plus simples, lorsque vous ajustez vos observations individuellement, l’ajustement total de l’ensemble de vos observations (au carré) doit avoir une valeur aussi basse que possible.

Le logiciel Trimble Geomatics Office teste ces critères pour vous et vous informe de toute observation ou tout point de contrôle qui empêche l’ajustement de réseau de satisfaire à ce critère.

Quand et pourquoi ajuster le réseau

Commencez votre ajustement de réseau après l’une des opérations suivantes :

  Traitement de lignes de base GPS (traitement de vos données GPS brutes)

  Importation de vos lignes de base RTK (avec données QC1 et QC2) et/ou données terrestres

  Suppression des indicateurs d’erreur pour les erreurs indiquant des valeurs hors tolérance

ASTUCE : Avant de commencer un ajustement, Trimble vous recommande vivement de lire l’Annexe A, Guide pour les ajustements par la méthode des moindres carrés, que vous trouverez dans le Manuel de l’utilisateur pour l’ajustement de réseau de Trimble Geomatics Office.

NOTE : Si vous avez effectué ou importé (à partir d’un fichier DC) une calibration du site GPS avant d’effectuer un ajustement de réseau, il vous est demandé d’accepter la suppression de la calibration du site GPS (paramètres) avant de commencer l’ajustement de réseau. Le logiciel Trimble Geomatics Office ne permet pas que votre projet comporte à la fois des paramètres de transformation d’un ajustement de réseau et des paramètres de calibration d’une calibration du site GPS ; votre projet peut comporter un seul de ces types de paramètres, pas les deux.

Procédures d’ajustement de réseau

Les deux procédures principales d’ajustement de réseau comprennent les étapes suivantes :

1.	Commencez par un ajustement contraint imperceptiblement (ou un ajustement libre lorsque des contraintes internes sont utilisées) pour ajuster vos observations et effectuer un contrôle de leur qualité. Cette étape permet de :

  contrôler la cohérence interne du réseau

  détecter les bévues ou les observations s’adaptant mal

  obtenir des estimations précises pour les erreurs d’observation

2.	Effectuez un ajustement contraint complètement. Cette étape permet de :

  référencer le réseau par rapport à un contrôle existant (datum)

  vérifier le contrôle existant

  produire des paramètres de transformation de réseau

  obtenir des estimations précises pour les erreurs de coordonnées

Pour de plus amples informations sur la réalisation d’un ajustement avec une combinaison d’observations GPS et terrestres, référez-vous à la rubrique Effectuer un ajustement combiné.

NOTE : Après avoir effectué un ajustement contraint imperceptiblement d’observations GPS sur le datum WGS-84, vous pouvez enregistrer les coordonnées WGS-84 des points ajustés. Ces coordonnées WGS-84 sont enregistrées pour être utilisées comme points GPS dans une calibration du site GPS. Après avoir généré des coordonnées de grille locales dans un ajustement contraint complètement pour les utiliser comme points de grille dans la calibration, vous pouvez effectuer une calibration pour l’utiliser sur le terrain (Implantation). Avant que vous ne puissiez commencer une calibration du site GPS, il vous est demandé d’accepter la suppression des paramètres de transformation d’ajustement. Vérifiez que vous avez effectué l’ajustement de réseau avant de commencer la calibration de votre site GPS. Pour de plus amples informations, référez-vous à Calibration du site GPS.

NOTE : Si vous avez l’intention d’effectuer un ajustement de réseau à l’aide de données transférées du logiciel Trimble Survey Controller, veillez à entrer une pression, une température ainsi qu’une correction de réfraction et de courbure dans le style de levé du Survey Controller lorsque vous effectuez le levé.


    Datum - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

En termes généraux, un datum est un système de référence utilisé pour déterminer des coordonnées de points à la surface de la terre. Divers datum locaux sont utilisés à travers le monde pour définir les coordonnées d’une zone locale. Il existe également des datum internationaux utilisés pour définir des coordonnées à l’échelle internationale. En général, les points de contrôle connus que vous utilisez dans vos levés sont basés sur un système de coordonnées local utilisant l’un des datum locaux. Lors de la collecte d’observations GPS sur le terrain, les observations sont référencées par rapport à un datum international appelé WGS-84.

Lors de la création de votre projet et de la définition de ses propriétés dans le logiciel Trimble Geomatics Office, vous devez avoir sélectionné un système de coordonnées pour le projet, ce système étant référencé par rapport à un datum local particulier (datum du projet). Ce système de coordonnées du projet et le datum sont utilisés pour générer des coordonnées pour tous les points du projet.

Avant d’effectuer un ajustement de réseau, vous pouvez sélectionner le datum utilisé pour les étapes des ajustements contraint imperceptiblement et contraint complètement. Dans cette section, nous l’appelons le datum d’ajustement. Vous pouvez sélectionner WGS-84 ou le datum du projet comme datum d’ajustement. La sélection d’un datum d’ajustement affecte uniquement l’ajustement.

Si vous effectuez un ajustement contraint imperceptiblement d’observations GPS, utilisez le datum WGS-84, à savoir le datum utilisé par le Système de positionnement global. L’utilisation d’un datum autre que le WGS-84 conduit l’ajustement à appliquer un résidu plus ou moins important à chaque observation pour compenser les différences du système de référence.

Vous devez sélectionner le datum correct pour chaque étape de l’ajustement, à savoir :

  Sélectionnez le datum WGS-84 avant d’effectuer un ajustement contraint imperceptiblement avec des données GPS.

  Sélectionnez le datum du projet avant d’effectuer un ajustement contraint imperceptiblement avec des données terrestres. (Lorsque le datum sélectionné pour l’ajustement contraint imperceptiblement n’est pas le datum du projet, le datum du projet est sélectionné avant d’effectuer un ajustement contraint complètement.)

NOTE : WGS-84 peut être utilisé comme datum du projet. Certains levés utilisent les points de contrôle référencés par rapport à un système de coordonnées utilisant WGS-84 comme datum. Dans ce cas, le datum sélectionné pour l’ajustement contraint imperceptiblement et l’ajustement contraint complètement est le même.

NOTE : Les Coordonnées de grille et Coordonnées locales résumées dans la fenêtre Propriétés sont toujours affichées à l’aide du système de coordonnées sélectionné pour le projet. La sélection de WGS-84 comme datum d’ajustement n’affecte aucunement l’affichage des coordonnées locales et de grille.

Pour de plus amples informations, référez-vous à Sélection d’un datum.


    Datum WGS-84

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Si vous effectuez un ajustement contraint imperceptiblement d’observations GPS, utilisez le datum WGS-84 (le datum utilisé par le Système de positionnement global).

Si vous n’utilisez pas le datum WGS-84 lors de l’ajustement des lignes de base GPS, l’ajustement produit différents résultats de pondération. Cela s’explique par le fait que des différences de datum sont intégrées dans les observations lors du procédé de modélisation des lignes de base.

Pour de plus amples informations, référez-vous à Sélection d’un datum.


    Datum du projet

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Le Datum du projet est sélectionné dans la tabulation Système de coordonnées du dialogue Propriétés du projet.

Après avoir effectué un premier ajustement contraint imperceptiblement, sélectionnez le Datum du projet comme datum d’ajustement.

L’ajustement contraint complètement applique les paramètres de transformation requis pour :

  référencer vos observations GPS (WGS-84) par rapport à votre système de coordonnées local (Datum du projet).

  transformer des observations terrestres afin qu’elles s’adaptent à votre contrôle local.

Lors de cette étape de l’ajustement, vous pouvez contraindre des points de contrôle par rapport au datum du projet, transformant ainsi vos observations référencées WGS-84 selon le datum sélectionné pour votre projet.

Pour de plus amples informations, référez-vous à Sélection d’un datum.


    Groupes d'observation - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Le Logiciel d’ajustement de réseau vous permet de séparer des ensembles d’observations en groupes. Vous pouvez créer les types de groupes suivants :

  Groupes de variance

  Groupes de transformation

La séparation des observations en groupes vous permet de mieux évaluer les erreurs de chaque type d’observations.

Groupes de variance

Dans les levés, divers groupes de mesures sont souvent utilisés pour un réseau unique. L’ajustement doit disposer d’un moyen lui permettant de rendre compte des différences d’erreurs associées à ces mesures GPS. Dans le logiciel Trimble Geomatics Office, les groupes de variance offrent la possibilité de séparer ces observations en groupes.

Il est facile de comprendre que plus les méthodes de levé sont précises, moins les erreurs de mesure sont importantes.

Le processeur d’ajustement détermine un facteur de référence et des degrés de liberté individuels pour chaque groupe. Cette section montre comment chaque groupe contribue à l’ajustement de réseau global. Chaque groupe peut être mis à l’échelle individuellement à l’aide de l’option Groupes de variance du contrôle Appliquer scalaires à du dialogue Stratégies de pondération.

Par défaut, les observations GPS, terrestres et de géoïde sont automatiquement séparées en groupes de variance par défaut (les groupes <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut>).

NOTE : Le groupe <Géoïde par défaut> sera toujours le seul groupe de variance de géoïde disponible dans tout ajustement de réseau. Puisque la même méthode est utilisée pour interpoler chaque observation de géoïde du même modèle de géoïde, il n’est pas nécessaire de séparer ces observations en groupes multiples.

NOTE : Si certaines de vos observations ont été effectuées sur des lignes très courtes (< 25 mètres), Trimble vous recommande de créer un groupe de variance séparé pour ces observations afin que celles-ci soient mises à l’échelle séparément.

Groupes de transformation

Les groupes de transformation sont des sélections d’observations soumises collectivement au même ensemble de transformations ou transformation lors d’un ajustement. Chaque groupe de transformation comporte un ensemble de paramètres de transformation qui peuvent être appliqués individuellement ou en groupes pour transformer les observations d’un groupe de transformation.

Vous pouvez contrôler les transformations appliquées à chaque groupe en définissant un ou plusieurs paramètres de transformation. Si vous n’êtes intéressé que par l’application de transformations aux paramètres de déviation, vous pouvez configurer l’Etat de chaque paramètre de transformation de déviation sur Calculé et laisser les autres paramètres configurés sur Inutilisé.

Par défaut, les paramètres de transformation suivants sont configurés sur Calculé pour les groupes de transformation d’observations GPS :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

Par défaut, seule la Rotation d’azimut est configurée sur Calculé pour les observations terrestres. Les autres paramètres peuvent être configurés sur Défini par l’utilisateur ou Calculé, mais ils ne sont utilisés que lorsqu’une erreur systématique est présente dans les observations. Par exemple, lorsqu’un ajustement est effectué et que toutes les distances (mesurées par des techniques terrestres) présentent un résidu de +3 ppm, il est possible qu’un paramètre de distance d’échelle soit calculé parce qu’il y a une erreur systématique dans la collecte des données. Cette erreur systématique peut être due au fait que le paramètre ppm de l’appareil électronique de mesure des distances n’est pas appliqué.

NOTE : Le logiciel Trimble Geomatics Office vous permet d’entrer des paramètres de transformation définis par l’utilisateur. Trimble vous recommande de veiller à ce que vous compreniez bien ce que sont les paramètres de transformation avant d’essayer de définir des Valeurs entrées manuellement pour tout paramètre.

Pour de plus amples informations sur les Paramètres de transformation, référez-vous à la rubrique Paramètres de transformation - Vue d’ensemble.


    Rapport d'ajustement de réseau - Vue d'ensemble

Plus amples informations

Voir aussi	Dialogue
Vue d'ensemble

Utilisez ce rapport pour afficher les messages et statistiques générés lors d’un ajustement de réseau.

Pour afficher le dialogue Rapport d’ajustement de réseau :

  Sélectionnez Rapports / Rapport d’ajustement de réseau.

L’afficheur HTML par défaut de votre ordinateur démarre et le Rapport d’ajustement de réseau s’affiche.

Une fois que le rapport est affiché, vous pouvez utiliser les commandes de l’afficheur HTML pour naviguer jusqu’aux sections suivantes :

  Paramètres de style d’ajustement

  Tolérances résiduelles

  Affichage de covariance

  Contrôles terrestres

  Erreurs d’installation

  Résumé statistique

  Nombre d’itérations

  Statistiques globales

  Statistiques d’observations GPS

  Statistiques du modèle de géoïde

  Statistiques d’observations terrestres

  Stratégies de pondération

  Coordonnées ajustées

  Coordonnées de grille

  Coordonnées géodésiques

  Delta de coordonnées

  Comparaisons de coordonnées de contrôle

  Observations ajustées

  Observations GPS

  Observations de géoïde

  Observations terrestres

  Histogrammes des résidus standardisés

  Ellipses d’erreur de point

  Valeurs de covariance

Des directives sur l’évaluation des statistiques de rapport sont incluses dans les rubriques listées ci-dessus.

NOTE : Vous pouvez sélectionner des observations hors normes dans l’Affichage du levé en les sélectionnant dans le Rapport d’ajustement de réseau. Pour cela, sélectionnez l’ID d’observation dans le Rapport d’ajustement de réseau (pour sélectionner des observations multiples, utilisez la touche Ctrl). La sélection courante de l’Affichage du levé est supprimée et remplacée par l’/les observation(s) sélectionnée(s) dans le rapport.


    Ajuster - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Utilisez la commande Ajuster pour démarrer le procédé d’ajustement.

Pour débuter un ajustement, effectuez l’une des opérations suivantes :

  Dans le menu de l’Affichage du levé, sélectionnez Ajustement / Ajuster.

  Appuyez sur F10.

  Dans la barre du projet, sélectionnez le groupe Ajuster et cliquez sur l’icône Ajuster.

Toutes les itérations d’ajustement sont effectuées automatiquement une fois que le procédé a commencé. Utilisez la barre de statut pour contrôler l’état de l’ajustement de réseau ; des messages s’affichent au fur et à mesure que les itérations d’ajustement ont lieu.

Dans la plupart des cas, le processeur d’ajustement effectue le nombre maximum d’itérations défini dans le style d’ajustement. Lors de chaque itération, le résidu de chaque observation est testé pour déterminer s’il correspond à la tolérance définie dans le style d’ajustement. Le procédé d’ajustement se termine après un nombre inférieur d’itérations si le réseau converge avant que le nombre maximum d’itérations ait été atteint.

Une fois que les résidus des observations satisfont aux critères de test d’acceptance, le réseau converge et les opérations suivantes sont effectuées :

  Les valeurs ajustées de chaque point de l’ajustement de réseau sont enregistrées dans le projet comme valeurs courantes de coordonnées avec une qualité de point Ajusté.

  Un sous-enregistrement de coordonnées supplémentaire est créé pour chaque point de l’ajustement. Le type de sous-enregistrement est basé sur les critères suivants :

  Si un point est fixe dans l’ajustement et qu’il n’est pas importé à l’aide d’une Feuille de données NGS ou comme point de contrôle dans un fichier ASCII, un Sous-enregistrement saisi au bureau est également enregistré.

  Les valeurs d’ajustement de chaque point de l’ajustement de réseau deviennent la valeur de coordonnée avec une qualité de point Ajusté. La coordonnée contrainte du point et la qualité (de contrôle) du point conservent les valeurs entrées précédemment.

  Dans la fenêtre Propriétés, une page de coordonnées d’ajustement est créée pour chaque point de l’ajustement. La qualité de point Ajusté est assignée à tous les composants non contraints du point. Tous les composants contraints sont Nuls.

  Un recalcul est effectué automatiquement. Le recalcul détermine de nouvelles coordonnées pour tous les points qui n’appartiennent pas au réseau. Les nouvelles coordonnées sont calculées à l’aide des observations qui n’appartiennent pas au réseau, se propageant des coordonnées ajustées (et fixes).

  Le symbole des points ajustés change pour devenir un cercle jaune plein.

  Les ellipses d’erreur et les flèches sont générées pour chaque point de l’ajustement.

  Tous les autres points de l’ajustement de réseau sont enregistrés.

  Les symboles des points ajustés changent ; des cercles pleins jaunes s’affichent lorsque le fond de la fenêtre graphique est noir, ces cercles étant bleus avec le fond par défaut.

  Des Ellipses d’erreur sont générées pour chaque point ajusté de l’ajustement (pas pour les points horizontaux fixes).

Les valeurs ajustées peuvent être visualisées dans la page de propriétés de chaque point. Lorsque l’option d’affichage Erreur d’ellipse est activée, les ellipses sont affichées sur chaque point ajusté dans la fenêtre graphique.

Vous pouvez maintenant commencer à analyser les résultats de l’ajustement de réseau en affichant le Rapport d’ajustement de réseau.


    Stratégies de pondération - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Les Stratégies de pondération vous permettent de définir la méthode d’application des facteurs de pondération et de mise à l’échelle à chaque type d’observations ; GPS, terrestres et de géoïde. Le logiciel Trimble Geomatics Office vous permet de définir des stratégies de pondération séparées pour chaque type d’observations.

Il est important de pondérer chaque observation sur la base de son type et de sa qualité. Cela permet à l’ajustement de correctement mettre à l’échelle l’estimation d’erreur à priori de chaque observation. Lors de la définition des stratégies de pondération, vous devez appliquer un scalaire aux observations suivantes :

  Toutes les observations

  Chaque observation

  Groupes de variance

En général, vous appliquez le type de scalaire à toutes les observations ou à tous les groupes de variance en fonction des méthodes utilisées durant le levé. Lorsque vous configurez l’option Appliquer scalaire à sur Chaque observation, l’option de type de scalaire Défini par l’utilisateur est désactivée. L’application du scalaire à chaque observation est généralement utilisée à des fins d’analyse uniquement. L’application à chaque observation peut vous aider à trouver une observation individuelle à l’origine de problèmes dans votre réseau d’ajustement.

Une fois que vous avez sélectionné une méthode pour l’application d’un scalaire, vous pouvez définir le type de scalaire utilisé pour l’ajustement. Vous pouvez choisir parmi les scalaires suivants :

  Défaut

  Alternatif

  Défini par l’utilisateur

  Automatique

Dans certains ajustements, les estimations d’erreurs à priori calculées pour un groupe d’observations peuvent être sous-estimées. L’utilisation de la stratégie de pondération correcte vous permet de mettre à l’échelle les estimations à priori et ainsi d’estimer les erreurs correctes pour toutes les observations.

Au moment du début d’un ajustement, la stratégie de pondération par défaut est configurée sur Appliquer le type de scalaire par défaut à toutes les observations. Le scalaire par défaut multiplie simplement l’erreur à priori par 1,00, sans modifier les estimations d’erreurs.

Si l’erreur estimée pour vos observations correspond à l’erreur réelle, le facteur de référence reporté devrait être environ 1,00. Après l’ajustement, il se peut que le facteur de référence ne soit pas proche de 1,00, indiquant ainsi qu’une certaine mise à l’échelle est requise pour faire correspondre l’erreur estimée à l’erreur réelle. La méthode la plus simple pour appliquer le scalaire consiste à sélectionner le type de scalaire alternatif. Le type de scalaire alternatif utilise le facteur de référence de l’ajustement courant, multiplié par le scalaire précédent, pour déterminer le scalaire de l’ajustement suivant. Cela permet d’obtenir un facteur de référence plus proche de 1,00. Le scalaire Alternatif est appliqué aux ajustements successifs jusqu’à ce que le facteur de référence soit approximativement de 1,00 et que le test du chi carré soit passé avec succès. L’option de type de scalaire automatique permet d’automatiser ce procédé.

NOTE : Le facteur de référence du premier ajustement doit avoir une valeur acceptable avant que le type de scalaire alternatif puisse être utilisé. En général, un facteur de référence élevé indique la présence d’une grosse erreur dans l’ajustement. Vérifiez les valeurs hors normes (c.-à-d. des observations avec des résidus élevés) avant de commencer l’ajustement suivant. L’application du type de scalaire alternatif à un ajustement avec un facteur de référence élevé entraîne l’augmentation du scalaire jusqu’à une valeur inacceptable.

Une fois que le facteur de référence est acceptable et que le test du chi carré est passé avec succès, vous pouvez verrouiller le dernier scalaire calculé. Le verrouillage automatique du scalaire configure le Type de scalaire sur Défini par l’utilisateur.

ATTENTION : Faites attention lorsque vous sélectionnez Défini par l’utilisateur pour le type de scalaire et entrez des valeurs scalaires. Avant d’utiliser le type de scalaire Défini par l’utilisateur, vous devez avoir bien compris les notions d’estimations d’erreurs, de stratégies de pondération et de scalaires.


    Commandes - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Toutes les commandes nécessaires à la réalisation d’un ajustement de réseau se trouvent dans le menu Ajustement. La commande permettant de générer un Rapport d’ajustement de réseau se trouve dans le menu Rapports. Les commandes d’Ajustement de réseau sont listées dans l’ordre dans lequel elles sont utilisées pour réaliser un ajustement. Utilisez les commandes d’Ajustement de réseau pour vous aider à réaliser un ajustement de votre réseau.

Les commandes suivantes sont disponibles dans le menu Ajustement :

  Datum

  WGS-84 (Datum)

  Datum du projet

  Styles d’ajustement

  Points

  Observations

  Groupes d’observation

  Groupes de transformation

  Groupes de variance

  Stratégies de pondération

  Ajuster

  Coordonnées de calibration

  Enregistrer(Coordonnées de calibration)

  Supprimer (Coordonnées de calibration)

  Supprimer ajustement

La commande suivante est disponible dans le sous-menu Afficher / Barres d’outils.

  Contrôles d’ellipse

NOTE : La sélection de la commande Ellipses d’erreur équivaut à sélectionner la case à cocher Afficher ellipses d’erreur de point et flèches dans le dialogue Options d’affichage − tabulation Contrôles d’ellipse d’erreur.

Les commandes suivantes sont disponibles dans la barre d’outils Contrôles d’ellipse :

  Ellipses d’erreur

  Erreurs de hauteur

  Erreurs d’élévation

La commande suivante est disponible dans le menu Rapport :

  Rapport d’ajustement de réseau

La commande suivante est disponible dans dialogue Observations :

  Désactiver observations

NOTE : La commande Désactiver observations équivaut à modifier de l’état d’une observation pour Désactivé dans la fenêtre Propriétés. Les observations désactivées ne peuvent pas être réactivées à partir de la fenêtre Propriétés. Pour de plus amples informations, référez-vous à Désactivation d’observations et Réactivation d’observations désactivées.


    Paramètres de transformation - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Les transformations sont calculées durant l’ajustement contraint complètement sur la base de la configuration des paramètres de transformation sélectionnée pour les groupes de transformation individuels. Chaque groupe de transformation comprend des observations GPS, terrestres ou de géoïde et un ensemble associé de paramètres de transformation qui, s’ils sont calculés, peuvent être appliqués à des observations de groupe de transformation.

Chaque groupe de transformation comprend sept paramètres. Ces sept paramètres de transformation possèdent chacun un champ Valeur qui peut éventuellement être utilisé pour définir la valeur du paramètre de transformation appliquée durant un ajustement contraint complètement. Chaque champ Valeur est assorti d’un paramètre d’Etat qui détermine la valeur du champ Valeur si ce dernier n’est pas défini, ni calculé ni défini par l’utilisateur.

Les sept paramètres suivants sont disponibles :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

Les quatre premiers paramètres sont généralement utilisés pour les transformations de datum, telles que la transformation du datum WGS-84 en un datum (local) de projet. Les déviations contrôlent l’inclinaison de l’horizon, la rotation d’azimut est appliquée aux azimuts et l’échelle du réseau est appliquée à toutes les observations linéaires (distance et hauteur).

Les trois paramètres restants sont généralement utilisés pour remédier à des erreurs systématiques éventuelles d’un groupe d’observations.

Par défaut, les paramètres de transformation suivants sont configurés sur Calculé pour les groupes de transformation d’observations GPS :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

Par défaut, seule la rotation d’azimut est configurée sur Calculé pour les observations terrestres. Les autres paramètres peuvent être configurés sur Défini par l’utilisateur ou Calculé, mais ils ne sont utilisés que lorsqu’une erreur systématique est présente dans les observations. Par exemple, lorsqu’un ajustement est effectué et que toutes les distances (mesurées par des techniques terrestres) présentent un résidu de +3 ppm, il est possible qu’un paramètre de distance d’échelle soit calculé parce qu’il y a une erreur systématique dans la collecte des données. Cette erreur systématique peut être due au fait que le paramètre ppm de l’appareil électronique de mesure des distances n’est pas appliqué.

NOTE : Les paramètres de rotation d’azimut, d’échelle du réseau, d’échelle de distance et de constante de distance ne sont pas utilisés pour les transformations de géoïde.

La configuration de l’état d’un paramètre sur calculé ne signifie pas que le paramètre est calculé et appliqué durant l’ajustement contraint complètement. Le logiciel évalue le nombre de contraintes du réseau et détermine si le nombre de contraintes requises pour le calcul d’un paramètre est disponible. Par exemple, les déviations requièrent la fixation d’un minimum de trois coordonnées verticales dans un réseau. Si moins de trois coordonnées verticales sont maintenues fixes, les paramètres de déviation ne sont pas calculés ni appliqués.

Le paramètre d’état défini par l’utilisateur vous permet de prédéfinir toute ou toutes les transformation(s) appliquée(s) à un groupe de transformation. Si l’état est configuré sur défini par l’utilisateur, la valeur entrée est appliquée à l’observation et n’est pas calculée durant l’ajustement.

NOTE : Bien que le logiciel Trimble Geomatics Office vous permette d’entrer des paramètres de transformation définis par l’utilisateur, vous devez bien comprendre la notion de paramètres de transformation avant de tenter de définir tout paramètre de transformation.

Lorsqu’un Rapport d’ajustement de réseau est généré, l’état d’un paramètre dicte la manière dont la valeur fait l’objet d’un rapport : l’un ou la totalité des éléments suivants est généré :

  Si l’état d’un des paramètres a été configuré sur inutilisé, la valeur de paramètre n’est pas rapportée dans le section Observations ajustées du rapport.

  Si l’état d’un des paramètres a été configuré sur calculé et que l’ajustement n’a pas été en mesure de calculer une valeur de paramètre du fait d’un nombre insuffisant de contraintes, aucune valeur de paramètre n’est incluse dans la section Observations ajustées du rapport. Une fois que l’ajustement est en mesure de calculer les paramètres, la valeur de paramètre est incluse dans la section Observations ajustées du rapport.

  Si l’état d’un des paramètres a été configuré sur défini par l’utilisateur, la valeur de paramètre entrée est rapportée, quel que soit le nombre de contraintes.

ASTUCE : Vous pouvez également afficher les paramètres de transformation à partir de la tabulation Ajustement de la tabulation détaillée Système de coordonnées de la fenêtre Propriétés du projet.

NOTE : L’observation observée est affichée dans la fenêtre Propriétés lors de la sélection d’une observation. L’observation ajustée ou transformée ne peut pas être visualisée dans la fenêtre Propriétés.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Coordonnées de calibration - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

L’enregistrement des coordonnées de calibration vous permet de stocker vos coordonnées GPS sur le datum WGS-84 d’un point. Ces coordonnées sont enregistrées après la réalisation d’un ajustement contraint imperceptiblement. Après avoir effectué un ajustement contraint complètement sur le datum local, vous pouvez enregistrer les coordonnées de grille du point.

NOTE : L’option Enregistrer coordonnées de calibration est disponible uniquement lorsque le datum d’ajustement est configuré sur WGS-84 et que seules les observations GPS ont été ajustées.

Les deux méthodes suivantes vous permettent de créer des coordonnées de calibration :

  Points existants

  Nouveaux points avec suffixe

Le groupe Enregistrer coordonnées pour calibration comprend les options suivantes :

Points existants

Si vous choisissez d’enregistrer les coordonnées sous les points existants, les coordonnées sont enregistrées sous l’enregistrement de point correspondant. Ces coordonnées sont utilisées uniquement pour positionner le point s’il n’y a pas d’autres données de levé disponibles. Elles sont enregistrées à des fins de calibration uniquement.

Si les points sont enregistrés sous des points existants, la liste Points du dialogue Calibration du site GPS est automatiquement remplie.

Nouveaux points avec suffixe

Si vous choisissez d’enregistrer les coordonnées sous Nouveaux points avec suffixe : GPS, un nouveau point est créé avec le nom du point « <Nom du point>-GPS> ». Ces coordonnées sont utilisées uniquement pour positionner le point s’il n’y a pas d’autres données de levé disponibles. Elles sont enregistrées à des fins de calibration uniquement.

Utilisez cette option pour conserver les points GPS et de grille utilisés pour une calibration de site GPS comme entités séparées.

Afficher coordonnées de calibration

Une fois que les coordonnées de calibration ont été enregistrées dans le projet, vous pouvez afficher les propriétés des points de calibration dans la fenêtre Propriétés.

Supprimer coordonnées de calibration

Vous pouvez également supprimer des coordonnées de calibration. La commande Coordonnées de calibration du menu Ajustement permet d’afficher un sous-menu avec une commande Supprimer pour supprimer les coordonnées de calibration du projet.


    Page Coordonnées générée par l'ajustement de réseau

Plus amples informations

 Voir aussi

Vue d'ensemble

Lorsque vous effectuez un ajustement de réseau, des coordonnées ajustées sont générées pour chaque point non contraint de l’ajustement. Vous pouvez afficher les coordonnées ajustées dans la fenêtre Propriétés.

La coordonnée ajustée est générée dans le datum d’ajustement courant. Par exemple :

  Si l’ajustement de réseau est effectué sur le datum WGS-84, une coordonnée WGS-84 d’ajustement est créée.

  Si l’ajustement de réseau est effectué sur le datum du projet, une coordonnée de grille d’ajustement est créée.

NOTE : Les coordonnées qui ont été fixées dans le dialogue Points se voient octroyer la qualité Contrôle.  Vous ne pouvez pas éditer ces coordonnées.

Les coordonnées de qualité Ajusté sont utilisées avant les coordonnées de contrôle non fixes. Elles sont supprimées avant les ajustements suivants et lorsque l’ajustement est lui-même supprimé.


L'importance de l'homogénéisation des coordonnées dans l'ajustement de réseau

Avant d’ajuster des données de votre projet Trimble Geomatics Office, vous devez importer des points de contrôle de bonne qualité. Cela s’explique par le fait qu’après l’importation de vos données dans le logiciel, vous devez effectuer un recalcul pour déterminer la position calculée des points importés, le logiciel utilisant les points de contrôle pour effectuer ses propres calculs.

Les coordonnées dont les points de début ne sont pas les meilleurs peuvent entraîner une mise à l’échelle incorrecte des observations durant la modélisation des lignes de base, ce qui à son tour peut conduire l’ajustement de réseau à produire des résultats erronés. Les erreurs de coordonnées verticales produisent des erreurs de mise à l’échelle durant la modélisation.

Pour empêcher des coordonnées de mauvaise qualité d’être transférées à l’ajustement, veillez à ce que :

  les observations soient effectuées d’une coordonnée de haute qualité

  les données soient homogènes, c.-à-d. qu’elles ne comprennent aucune grosse erreur de fermeture

Si vous essayez d’effectuer un ajustement alors que des erreurs de fermeture existent dans votre projet, le dialogue d’avertissement Données non homogènes s’affiche. Supprimez les données non homogènes avant de poursuivre avec l’ajustement contraint imperceptiblement.

NOTE : Le logiciel vérifie la présence de données non homogènes uniquement lors d’un ajustement avec des scalaires par défaut. Si vous éditez des données et avez l’intention d’effectuer un autre ajustement, vérifiez que l’option Scalaire par défaut (dans les tabulations GPS, Terrestre et Géoïde) du dialogue Stratégies de pondération est configurée.


Messages d'erreur Echec d'ajustement

Vue d'ensemble

Les messages d’erreur suivants peuvent s’afficher lors de la réalisation d’un ajustement :

  Echec d’ajustement − Pas de convergence

  Echec d’ajustement − Instabilité de la coordonnée horizontale ou verticale

  Echec d’ajustement − Instabilité de transformation

Ces trois erreurs peuvent se produire lors d’un ajustement pour différentes raisons. Utilisez les messages pour identifier les points problématiques de votre ajustement puis examinez vos données.

Echec d’ajustement − Pas de convergence

Un ajustement est considéré comme terminé lorsque les coordonnées ajustées du point ne changent pas d’une itération d’ajustement à l’autre. Ce message s’affiche lorsque les coordonnées des points de l’ajustement changent et que la différence entre leur nouvelle valeur et la valeur précédente est supérieure aux tolérances résiduelles. Il se peut que les données comportent une bévue qui empêche l’ajustement de converger. Par exemple :

  Les coordonnées non ajustées d’un point peuvent ne pas être proches des valeurs ajustées

  Il est possible qu’une observation comporte une erreur (par exemple, un azimut peut présenter une erreur de 180 degrés).

Vous devez vous assurer que toutes les bévues sont supprimées avant un ajustement.

Ce message peut également être dû à des angles de l’ajustement dont les distances observées sont inférieures à 25 mètres. Augmentez la « Tolérance résiduelle Pour finir itérations » jusqu’à une valeur adaptée aux coordonnées changeantes (1,0 e-3 m).

Echec d’ajustement − Instabilité de la coordonnée horizontale ou verticale

Ce message est dû à une erreur mathématique lors des calculs d’ajustement.

Il vous indique si le problème provient d’une coordonnée horizontale ou verticale et identifie le point à l’origine de l’erreur. Examinez votre réseau, identifiez le point problématique et vérifiez vos données.

Echec d’ajustement − Instabilité de transformation

Ce message est dû à une erreur mathématique lors des calculs d’ajustement. Il vous indique quel paramètre est à l’origine du problème ainsi que le nom du groupe de transformation.

Il s’affiche si la partie GPS d’un réseau n’est pas complètement intégrée à la partie terrestre. Par exemple, ce phénomène peut se produire dans un réseau combiné d’observations GPS et terrestres lorsque la partie terrestre du réseau consiste en deux ou plusieurs segments qui ne sont pas connectés les uns aux autres. Pour de plus amples informations, référez-vous à la rubrique Combiner différents types d’observations dans un ajustement de réseau.

Vérifiez qu’il existe un nombre suffisant d’observations pour lier les observations GPS et terrestres les unes aux autres et/ou désactivez les transformations GPS.

Sinon, résolvez le problème en contraignant les coordonnées d’un point directement connecté à la partie GPS du réseau.


    Dialogue Styles d'ajustement de réseau - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour sélectionner, afficher, créer, copier, éditer, renommer et supprimer des styles d’ajustement. Le style courant est appelé le style actif. Les paramètres définis pour le style actif sont toujours appliqués à l’ajustement suivant.

Vous pouvez créer une bibliothèque de styles pour effectuer différents types d’ajustements et pour partager ces styles entre les projets multiples.

Pour afficher le dialogue Styles d’ajustement de réseau :

  Sélectionnez Ajustement / Styles d’ajustement.

Les options suivantes sont disponibles :

Style actif

Utilisez ce champ pour identifier le style actif courant de l’ajustement de réseau. Les nouveaux styles actifs doivent être sélectionnés dans la liste de styles et s’affichent dans ce champ. Ce champ sert uniquement à l’affichage et ne peut pas être édité.

Liste de styles

Sélectionnez le style actif dans cette liste. Une fois qu’un style est actif, un des boutons à droite du dialogue peut être sélectionné pour éditer, copier, renommer ou supprimer le style.

Si vous sélectionnez un style puis cliquez sur OK, le style devient style actif pour l’ajustement.

Le logiciel Trimble Geomatics Office comprend de nombreux styles d’ajustement prédéfinis. Vous pouvez les copier et les utiliser comme base pour créer de nouveaux styles, ou vous pouvez créer vos propres nouveaux styles. Tous les styles d’ajustement peuvent être édités.

Les styles de cette liste ne sont pas enregistrés dans le projet mais dans le Registre de Windows où ils peuvent être utilisés pour des projets multiples.

Editer

Cliquez sur ce bouton pour afficher ou éditer les styles. Lorsque vous sélectionnez ce bouton, le style sélectionné dans la liste de styles devient style actif, et le dialogue Editer styles d’ajustement s’affiche avec les options permettant d’éditer le style d’ajustement.

Nouveau

Cliquez sur ce bouton pour créer un nouveau style d’ajustement. Lorsque vous cliquez sur ce bouton, le dialogue Nouveau style s’affiche.

Une fois qu’un nom a été donné au nouveau style, ce dernier devient style actif, et le dialogue Editer styles d’ajustement s’affiche avec les options permettant d’éditer le style d’ajustement. Pour de plus amples informations, référez-vous à Création de styles.

NOTE : Le style « Limites de confiance 95% » est utilisé comme style par défaut lorsque des styles nouveaux sont créés.

Copier

Cliquez sur ce bouton pour copier le style actif et l’utiliser comme source pour la création d’un nouveau style d’ajustement. Lorsque vous cliquez sur ce bouton, la copie du style devient style actif et le dialogue Copier style s’affiche.

Une fois qu’un nom a été donné au nouveau style, le dialogue Editer styles d’ajustement s’affiche avec les options permettant d’éditer le style d’ajustement. Pour de plus amples informations, référez-vous à Copie de styles.

Renommer

Cliquez sur ce bouton pour afficher le dialogue Renommer style. Utilisez le champ Nom pour entrer le nom du nouveau style. Lorsque vous cliquez sur OK, le nom du style se trouvant dans le Registre de Windows change, le style devient style actif et le nouveau nom s’affiche dans le champ Styles actifs. Pour de plus amples informations, référez-vous à Renommer les styles.

Supprimer

Cliquez sur ce bouton pour supprimer le style actif. Les styles supprimés sont retirés du Registre de Windows de façon permanente et ne sont plus disponibles. Pour de plus amples informations, référez-vous à Suppression de styles.


    Dialogue Editer styles d'ajustement - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Affichez ce dialogue lorsque vous souhaitez afficher ou éditer le style d’ajustement actif.

Pour afficher le dialogue Editer styles d’ajustement :

1.	Pour afficher le dialogue Styles d’ajustement de réseau, sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

Cliquez sur Editer.

Le dialogue Editer styles d’ajustement de réseau s'affiche.

Les tabulations suivantes sont disponibles :

Général

Sélectionnez cette tabulation pour afficher ou éditer les tolérances résiduelles, les scalaires sigma et les propriétés générales d’un style d’ajustement. Pour de plus amples informations, référez-vous à Général.

Affichage de covariance

Sélectionnez cette tabulation pour afficher ou éditer les options d’affichage en deux dimensions et en trois dimensions pour le style d’ajustement. Pour de plus amples informations, référez-vous à Affichage de covariance.

Contrôles terrestres

Sélectionnez cette tabulation pour afficher ou éditer les paramètres d’erreur standard ainsi que pour sélectionner le type d’ajustement (horizontal, vertical ou les deux) à effectuer. Pour de plus amples informations, référez-vous à Contrôles terrestres.

Erreurs d'installation

Sélectionnez cette tabulation pour afficher ou éditer des erreurs connues de hauteur d’antenne, de centrage d’antenne, de hauteur d’instrument et de centrage d’instrument (plombage). Ces définitions sont appliquées globalement à toutes les observations pour compenser les erreurs lors du calcul d’ajustements. Pour de plus amples informations, référez-vous à Erreurs d’installation.


    Dialogue Editer styles d'ajustement - Tabulation Général

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez cette tabulation pour définir les tolérances résiduelles, les scalaires sigma et les propriétés générales d’un style d’ajustement.

Pour afficher la tabulation Général du dialogue Editer styles d’ajustement :

1.	Pour afficher le dialogue Styles d’ajustement de réseau, sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Sélectionnez la tabulation Général.

Les options suivantes sont disponibles :

Utiliser le profil de colonne réduit

Sélectionnez cette case à cocher pour réduire la quantité de mémoire informatique requise pour ajuster un réseau. Pour les réseaux importants, cette option réduit la durée requise pour effectuer un ajustement.

NOTE : Cette option utilise une combinaison d’algorithmes développés par le National Geodetic Survey américain (NGS).

L’utilisation de cette option n’a aucun effet sur vos résultats d’ajustement à l’exception de l’empêchement de l’affichage des Termes de covariance entre les points qui ne sont pas connectés par des observations.

Lors de l’utilisation de cette option, vous devez Fixer au moins un point de contrôle horizontal et un point de contrôle vertical.

Si vous effectuez un ajustement libre (c.-à-d. sans coordonnées fixes), vous ne pouvez pas utiliser l’option Utiliser le profil de colonne réduit. Pour les ajustements libres, la case à cocher de la tabulation Général du dialogue Styles d’ajustement est ignorée et l’ajustement a lieu sans que le profil de colonne réduit soit utilisé.

Limiter les termes de covariance aux lignes observées

Sélectionnez cette case à cocher pour limiter l’affichage des termes de covariance. La sélection de cette option n’a aucun effet sur les résultats finaux d’ajustement à l’exception de l’empêchement de l’affichage des termes de covariance entre les points qui ne sont pas connectés par des observations.

Lorsque la case à cocher est désélectionnée, les termes de covariance sont calculés entre toutes les permutations possibles de paires de points du réseau. Pour les réseaux importants, il est possible que la liste des termes de covariance du Rapport d’ajustement soit très longue.

Calculer les corrélations du modèle de géoïde

Lorsque vous utilisez des observations de géoïde dans un ajustement, conservez les coordonnées verticales (hauteur et élévation) fixes de manière à ce qu’une solution surdéterminée puisse exister et qu’un résidu de géoïde puisse être calculé pour les points contraints.

Lorsque la case à cocher Calculer les corrélations du modèle de géoïde est sélectionnée, les résidus de géoïde sont calculés, à l’aide des corrélations du modèle de géoïde entre les points, pour les points avec des coordonnées verticales non contraintes.

Lorsque la case à cocher est désélectionnée, les résidus sont calculés uniquement pour les points avec des hauteurs et élévations fixes.

Tolérances résiduelles

Utilisez ces options pour contrôler les tolérances résiduelles utilisées durant le procédé d’ajustement de réseau. Pour de plus amples informations, référez-vous à Tolérances résiduelles.

Scalaires sigma

Sélectionnez une option dans la liste pour fixer les scalaires sigma univariable et à deux variables. Pour de plus amples informations, référez-vous à Scalaires sigma.

Itérations maximum

Entrez le nombre maximum d’itérations permises lorsque l’ajustement tente de converger le réseau. Le nombre maximum d’itérations est 10 par défaut.


    Tolérances résiduelles

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces options permettent de contrôler les tolérances résiduelles utilisées durant l’ajustement de réseau. L’ajustement de réseau est un procédé itératif. La convergence de chaque itération d’ajustement est contrôlée sur la base de ces tolérances résiduelles :

Pour finir itérations

Entrez la tolérance résiduelle utilisée pour déterminer si des itérations d’ajustement doivent continuer ou s’arrêter.

Après chaque itération d’ajustement, un résidu est calculé à l’aide de deux programmes différents. La différence entre les deux résultats de calcul est comparée à la tolérance Pour finir itérations. Sur la base de cette comparaison, l’une des actions suivantes a lieu :

  Si la différence entre les résidus d’observation calculés est inférieure à la tolérance Pour finir itérations, les itérations d’ajustement s’arrêtent. Le message suivant est inclus dans le Rapport d’ajustement de réseau : Ajustement réussi dans # itération(s), où ## correspond au nombre d’itérations requises pour converger le réseau.

  Si la différence entre les résidus d’observation calculés est supérieure à la tolérance Pour finir itérations, les itérations d’ajustement continuent. Si l’ajustement continue jusqu’à ce que les Itérations maximum soient atteintes, le Seuil de convergence finale est utilisé (voir ci-dessous).

Seuil de convergence finale

Entrez la tolérance du seuil de convergence pour l’itération finale de l’ajustement de réseau. Le logiciel utilise cette valeur pour déterminer si l’ajustement de réseau a réussi lorsque l’itération finale ne dépasse pas la tolérance Pour finir itérations.

Si la différence calculée dans le résidu d’observation de la dernière itération d’ajustement est supérieure à la tolérance Pour finir itérations, le résidu est comparé au Seuil de convergence finale et l’une des actions suivantes a lieu :

  Si la différence calculée pour le résidu d’observation est inférieure au Seuil de convergence finale, l’ajustement a réussi et le message suivant s’affiche : « Convergence finale réussie après ## itérations (seuil de convergence utilisé) », où ## correspond au nombre d’itérations requises pour converger le réseau.

  Si le résidu d’observation est supérieur au Seuil de convergence finale, l’ajustement échoue et un dialogue d’avertissement s’affiche indiquant Echec d’ajustement. Aucune convergence.

Ces messages sont également écrits dans le Rapport d’ajustement de réseau.

La valeur entrée dans le champ Itérations maximum détermine le moment auquel l’itération finale se produit. Faites particulièrement attention lorsque vous modifiez le nombre d’itérations ou les tolérances Pour finir itérations et Seuil de convergence finale.


    Scalaires sigma

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces options fixent les scalaires sigma univariable et à deux variables. Les scalaires sigma univariables sont appliqués à l’ensemble des erreurs unidimensionnelles, des erreurs propagées des observations, des composants de coordonnées et à la précision horizontale. Les scalaires sigma à deux variables sont appliqués à l’ensemble des ellipses d’erreur en deux dimensions.

Par défaut, toutes les erreurs propagées sont affichées dans l’erreur standard 2-sigmas, équivalant à un niveau de confiance de 95 % pour les Scalaires sigma univariable et à deux variables.

Les options suivantes sont disponibles :

Univariable

Utilisez cette liste pour sélectionner le scalaire sigma univariable appliqué à l’ensemble des erreurs propagées des observations, des composants de coordonnées et à la précision horizontale. Ces erreurs sont toutes des erreurs unidimensionnelles.

Pour les méthodes Sphérique, de Bomford et US (américaine), les options suivantes sont disponibles :

  1.000 (68 %)

  1.646 (90 %)

  1.960 (95 %)

  2.575 (99 %)

A deux variables

Utilisez cette liste pour sélectionner le scalaire à deux variables appliqué à toutes les ellipses d’erreur. Les ellipses d’erreur sont des représentations graphiques d’erreurs en deux dimensions.

Les options suivantes sont disponibles :

  1.000 (39 %)

  2.147 (68 %)

  2.447 (95 %)

  3.035 (99 %)


    Dialogue Editer styles d'ajustement - Tabulation Affichage de covariance

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez cette tabulation afin de définir les options d’affichage de covariance en deux et en trois dimensions pour le style d’ajustement de réseau.

Pour afficher la tabulation Affichage de covariance du dialogue Editer styles d’ajustement :

1.	Pour accéder au dialogue Styles d’ajustement de réseau, sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Sélectionnez la tabulation Affichage de covariance. Les options de l’Affichage de covariance s’affichent.

Les options suivantes sont disponibles :

Horizontal

Utilisez ces options afin de définir les options d’affichage de covariance en deux dimensions pour le style d’ajustement de réseau. Pour de plus amples informations, référez-vous à Horizontal.

En trois dimensions

Utilisez ces options afin de définir les options d’affichage de covariance en trois dimensions pour l’ajustement. Pour de plus amples informations, référez-vous à En trois dimensions.


    Horizontal (Affichage de covariance)

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces options définissent les options d’affichage de covariance en deux dimensions pour l’ajustement.

Exprimer précision sous

Utilisez cette liste pour définir la méthode d’expression horizontale (2D) de la précision (P) sous des erreurs proportionnelles. Pour la précision horizontale, la distance est la distance horizontale entre les points.

Sélectionnez l’une des options suivantes :

  PPM − Sélectionnez cette option pour exprimer la précision horizontale en unités de X parties par million (où X = distance × P × 1,0e-06).

  Ratio − Sélectionnez cette option pour exprimer la précision horizontale en unités de X parties par million (où X = distance ÷ P).

  Aucun − Sélectionnez cette option pour désactiver l’affichage de la précision horizontale.

NOTE : La précision est calculée à l’aide de la formule suivante :

(E x S)2 = C2 + P2

où :

E est l’Erreur linéaire propagée

S est le scalaire sur l’Erreur linéaire propagée

C est le terme d’erreur constant

P est la Précision

Erreur linéaire propagée

Utilisez cette liste afin de définir l’erreur linéaire propagée horizontale (en deux dimensions) pour le style d’ajustement de réseau. L’erreur linéaire propagée calculée est à 1-sigma, quels que soient les Scalaires sigma univariable et à deux variables.

Sélectionnez l’une des options suivantes :

  US − Sélectionnez cette option pour utiliser l’erreur standard de la distance ajustée horizontale (2D) ou inclinée (3D).

  Canadien − Sélectionnez cette option pour utiliser le demi-grand axe de l’ellipse d’erreurs relatives 2D ou 3D.

  Bomford − Sélectionnez cette option pour utiliser la racine carrée de la somme des variances d’erreurs relatives 2D ou 3D.

  Sphérique − Sélectionnez cette option pour utiliser la moyenne des erreurs standard relatives 2D ou 3D.

Terme constant

Le Terme constant doit être spécifié dans les unités de projet configurées dans les propriétés du projet. Le terme doit se situer entre 0,0 m (0,0 pda) et 0,1 m (0,3 pda).

Scalaire sur erreur linéaire

Utilisez cette liste afin de définir le scalaire horizontal (en deux dimensions) pour la mise à l’échelle de la précision au niveau de confiance désiré. Pour la mise à l’échelle des matrices de covariance relatives, l’erreur linéaire propagée est mise au carré.

Pour les méthodes US (américaine), de Bomford et Sphérique, sélectionnez l’une des options suivantes :

  1.000 (68 %)

  1.646 (90 %)

  1.969 (95 %)

  2.575 (99 %)

Pour la méthode Canadienne, sélectionnez l’une des options suivantes :

  1.000 (39 %)

  2.147 (90 %)

  2.447 (95 %)

  3.035 (99 %)


    En trois dimensions (Affichage de covariance)

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces options définissent les options d’affichage de covariance en trois dimensions pour l’ajustement.

Exprimer précision sous

Sélectionnez la méthode d’expression de la précision (P) en trois dimensions (3D) sous des erreurs proportionnelles. Pour la précision en trois dimensions, la distance est la distance inclinée entre les points.

Sélectionnez l’une des options suivantes :

  PPM − Sélectionnez cette option pour exprimer la précision horizontale en unités de X parties par million (où X = distance × P × 1,0e-06).

  Ratio − Sélectionnez cette option pour exprimer la précision horizontale en unités de X parties par million (où X = distance ÷ P).

  Aucun − Sélectionnez cette option pour désactiver l’affichage de la précision horizontale.

NOTE : La précision est calculée à l’aide de la formule suivante :

(E x S)2 = C2 + P2

où

E est l’Erreur linéaire propagée

S est le scalaire sur l’Erreur linéaire propagée

C est le terme d’erreur constant

P est la Précision

Erreur linéaire propagée

Utilisez cette liste pour définir l’erreur linéaire propagée en trois dimensions pour le style d’ajustement de réseau.

L’erreur linéaire propagée calculée est à 1-sigma, quels que soient les Scalaires sigma univariable et à deux variables.

Sélectionnez l’une des options suivantes :

  US − Sélectionnez cette option pour utiliser l’erreur standard de la distance ajustée (horizontale (2D) ou inclinée (3D)).

  Canadien − Sélectionnez cette option pour utiliser le plus important demi-grand axe de l’ellipse d’erreurs relatives 2D ou 3D.

  Bomford − Sélectionnez cette option pour utiliser la racine carrée de la somme des variances d’erreurs relatives 2D ou 3D.

  Sphérique − Sélectionnez cette option pour utiliser la moyenne des erreurs standard relatives 2D ou 3D.

Terme constant

Le Terme constant doit être spécifié dans les unités de projet configurées dans les propriétés du projet. Le terme doit se situer entre 0,0 m (0,0 pda) et 0,1 m (0,3 pda).

Scalaire sur erreur linéaire

Utilisez cette liste afin de sélectionner le scalaire en trois dimensions pour la mise à l’échelle des précisions au niveau de confiance désiré. Pour la mise à l’échelle des matrices de covariance relatives, l’erreur linéaire propagée est mise au carré.

Pour les méthodes US (américaine), de Bomfort et Sphérique, sélectionnez l’une des options suivantes :

  1.000 (68 %)

  1.646 (90 %)

  1.969 (95 %)

  2.575 (99 %)

Pour la méthode Canadienne, sélectionnez l’une des options suivantes :

  1.00 (20 %)

  2.50 (90 %)

  2.80 (95 %)

  3.37 (99 %)

Utiliser les erreurs d'élévation si disponibles

Utilisez cette case à cocher pour déterminer si des erreurs d’élévation ou erreurs de hauteur d’ellipsoïde disponibles sont appliquées lors du calcul de la précision en trois dimensions (3D). Sélectionnez cette case à cocher pour que la précision en trois dimensions soit calculée à l’aide des erreurs d’élévation, ou désélectionnez-la pour appliquer les erreurs de hauteur d’ellipsoïde lors des calculs de précision en trois dimensions.

Lorsque cette case à cocher est sélectionnée, les erreurs d’élévation ne sont appliquées au calcul que lorsque les observations de géoïde sont chargées, ce qui vous permet de calculer des élévations. Par défaut, cette case à cocher est sélectionnée. Laissez-la sélectionnée si vous avez confiance en la qualité des points de contrôle verticaux fixes et du modèle de géoïde sélectionné.

Les erreurs de hauteur d’ellipsoïde sont utilisées et l’état de la configuration de cette option est ignoré dans les calculs de la précision en trois dimensions lorsque aucun modèle de géoïde n’est sélectionné dans les propriétés du projet.


    Dialogue Editer styles d'ajustement - Tabulation Erreurs d'installation

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce style pour définir des erreurs connues de hauteur d’antenne, de centrage d’antenne, de hauteur d’instrument et de centrage d’instrument (plombage). Ces définitions sont appliquées globalement à toutes les observations pour compenser les erreurs lors du calcul d’ajustements de réseau.

Pour afficher la tabulation Erreurs d’installation du dialogue Editer propriétés d’ajustement :

1.	Pour accéder au dialogue Styles d’ajustement de réseau, sélectionnez Ajustement /  Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Sélectionnez la tabulation Erreurs d’installation.

Dans le groupe GPS, les options suivantes sont disponibles :

Erreur dans hauteur d'antenne

Utilisez ce champ pour définir l’erreur estimée dans la hauteur d’antenne. L’erreur estimée est appliquée globalement à toutes les observations GPS lors du calcul de l’ajustement de réseau.

L’erreur estimée est basée sur le type d’outil de mesure et sur l’aptitude à lire la mesure.  Si un ruban d’acier est utilisé pour mesurer la hauteur d’antenne, les estimations d’erreur permise sont légèrement supérieures à celles d’un jalon de mesure de hauteur. Un jalon est un outil plus rigide de mesure de la hauteur, par opposition à un ruban flexible en acier.

Les erreurs estimées de hauteur d’antenne se situent généralement entre 0,000 et 0,004 m (0,000 et 0,013 pd). La valeur par défaut est 0,000 m (0,000 pd).

Erreur de centrage

Utilisez ce champ pour définir l’erreur estimée de centrage lors du plombage et du nivellement d’une antenne par rapport au point de levé.

L’erreur estimée est appliquée globalement à toutes les observations GPS lors du calcul de l’ajustement de réseau. L’erreur estimée est influencée par la qualité de l’entretien des tribrachs et par celle de leur centrage par rapport au point de levé.

Les erreurs de centrage se situent généralement entre 0,000 et 0,002 m (0,002 et 0,007 pd). La valeur par défaut est 0,000 m (0,000 pd).

Dans le groupe Terrestre, les options suivantes sont disponibles :

Erreur dans hauteur d'instrument

Utilisez ce champ pour définir l’erreur estimée dans la hauteur d’instrument ou la hauteur de destination. L’erreur estimée est appliquée globalement à toutes les observations terrestres lors du calcul de l’ajustement de réseau.

L’erreur estimée est basée sur le type d’outil de mesure et sur l’aptitude à lire la mesure. Les erreurs estimées de hauteur d’instrument se situent généralement entre 0,000 et 0,004 m (0,000 et 0,013 pd). La valeur par défaut est 0,000 m (0,000 pd).

Erreur de centrage

Utilisez ce champ pour définir l’erreur estimée de centrage lors du plombage et du nivellement d’un instrument ou d’une destination par rapport aux points de levé.

L’erreur estimée est appliquée globalement à toutes les observations terrestres lors du calcul de l’ajustement de réseau. L’erreur estimée est influencée par la qualité de l’entretien des tribrachs et par celle de leur centrage par rapport au point de levé.

Les erreurs de centrage se situent généralement entre 0,000 et 0,002 m (0,002 et 0,007 pd). La valeur par défaut est 0,000 m (0,000 pd).


    Dialogue Nouveau style

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour créer un nouveau style d’ajustement de réseau.

Pour afficher le dialogue Nouveau style :

1.	Pour accéder au dialogue Styles d’ajustement de réseau, sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Cliquez sur Nouveau. Le nouveau style devient style actif et le dialogue Nouveau style s’affiche.

Une seule option est disponible :

Nom

Sélectionnez ce champ pour entrer le nom du nouveau style d’ajustement de réseau. Le nom peut inclure jusqu’à 255 caractères mais les noms plus courts sont plus faciles à trouver dans la liste de styles. Après avoir donné un nom au style, cliquez sur OK pour afficher le dialogue Editer styles d’ajustement. Vous pouvez utiliser ce dialogue pour éditer les contrôles de style.


    Dialogue Copier style

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour créer un nouveau style d’ajustement de réseau sur la base d’une copie d’un autre style d’ajustement de réseau.

Pour afficher le dialogue Copier style :

1.	Pour accéder au dialogue Styles d’ajustement de réseau, sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez dans la liste de styles un style existant que vous souhaitez copier.

Cliquez sur Copier.

Le style copié devient style actif et le dialogue Copier style s’affiche.

Une seule option est disponible :

Nom

Sélectionnez ce champ pour entrer le nom du nouveau style d’ajustement de réseau. Une copie du fichier sélectionné dans la liste de styles est créée en utilisant le nouveau nom. Le nom peut inclure jusqu’à 255 caractères mais les noms plus courts sont plus faciles à trouver dans la liste de styles. Après avoir donné un nom au style, cliquez sur OK pour afficher le dialogue Editer styles d’ajustement. Vous pouvez utiliser ce dialogue pour modifier les contrôles de style d’ajustement.


    Dialogue Renommer style

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour renommer un style d’ajustement de réseau.

Pour afficher le dialogue Renommer style :

1.	Pour accéder au dialogue Styles d’ajustement de réseau, sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez dans la liste de styles un style que vous souhaitez renommer.

Cliquez sur Renommer.

Le dialogue Renommer style s'affiche.

Une seule option est disponible :

Nom

Entrez le nouveau nom du style d’ajustement de réseau dans ce champ. Le nom peut inclure jusqu’à 255 caractères mais les noms descriptifs plus courts sont plus faciles à trouver dans la liste de styles.


Dialogue Editer styles d'ajustement - Tabulation Contrôles terrestres

Plus amples informations

 Dialogue

Vue d'ensemble

Utilisez ce style d’ajustement pour définir les estimations d’erreur et contrôles terrestres.  Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Mesures	Les mesures terrestres disponibles, parmi lesquelles :   Angles horizontaux   Distances inclinées   Angles verticaux   Delta élévations   Lecture de mire parlante   Séparations de géoïde   Azimuts
Erreurs standard par défaut	Les erreurs standard sont utilisées lorsque aucune erreur standard n’est fournie avec l’observation.
Erreurs standard absolues minimum	Les erreurs standard absolues minimum. Ces erreurs sont utilisées lorsqu’elles sont supérieures aux erreurs standard fournies.
Erreurs standard proportionnelles minimum	Les erreurs standard proportionnelles minimum. Ces erreurs sont utilisées lorsque la somme du composant d’erreur absolue et du composant d’erreur proportionnelle est supérieure aux erreurs standard fournies. NOTE : Une erreur proportionnelle existe uniquement pour les distances inclinées.
Sélectionnez l’une des cases à cocher suivantes pour spécifier le type d’ajustement devant être effectué sur les observations terrestres :

  Effectuer ajustement vertical

  Effectuer ajustement horizontal


Ajouter des observations de groupe de transformation

 Vue d'ensemble et plus amples informations

Des observations peuvent être ajoutées à tout moment à un groupe de transformation défini par l’utilisateur. Des observations peuvent également être supprimées lorsqu’elles ne sont plus requises.

ASTUCE : Cliquez sur Filtrer pour afficher le dialogue Filtre d’observation avec les options vous permettant de filtrer les types d’observations de la liste Observations disponibles.

ASTUCE : Vous pouvez également déplacer les colonnes et les mettre à un autre emplacement, modifier la taille des colonnes pour afficher plus ou moins d’informations ainsi que trier par ordre ascendant ou descendant.

Pour ajouter des observations :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

NOTE : Vous ne pouvez pas éditer le Groupe de transformation de géoïde par défaut.

3.	Sélectionnez le Groupe de transformation.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s’affiche avec les observations du groupe sélectionné affichées dans la liste Observations du groupe.

5.	Sélectionnez une observation dans la liste Observations disponibles.

6.	Cliquez sur Ajoutez. L’observation est ajoutée à la liste Observations du groupe.

7.	Cliquez sur OK. Les modifications sont enregistrées.


Ajouter des observations de groupe de variance

Vue d'ensemble et plus amples informations
Des observations peuvent être ajoutées à tout moment à un groupe de variance. Des observations peuvent également être supprimées lorsqu’elles ne sont plus requises.

ASTUCE : Cliquez sur Filtrer pour afficher le dialogue Filtre d’observation avec les options vous permettant de filtrer les types d’observations de la liste Observations disponibles.

ASTUCE : Vous pouvez également déplacer les colonnes et les mettre à un autre emplacement, modifier la taille des colonnes pour afficher plus ou moins d’informations ainsi que trier par ordre ascendant ou descendant.

Pour ajouter des observations :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

NOTE : Vous ne pouvez pas éditer le Groupe de variance du Géoïde par défaut.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Editer. Le dialogue Editer groupes de variance s'affiche. La liste Observations du groupe indique les observations courantes du groupe, et la liste Observations disponibles indique toutes les observations activées du projet.

5.	Cliquez sur l’observation de la liste Observations disponibles que vous souhaitez ajouter au groupe.

6.	Cliquez sur Ajouter. L’observation est ajoutée à la liste Observations du groupe et supprimée de la liste Observations disponibles.

7.	Cliquez sur OK. Les modifications sont enregistrées.


Appliquer des stratégies de pondération

 Vue d'ensemble et plus amples informations

Des stratégies de pondération peuvent être appliquées à l’itération suivante d’un ajustement.

Pour appliquer des stratégies de pondération :

1.	Sélectionnez Ajustement / Stratégies de pondération. Le dialogue Stratégies de pondération s’affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Editer les stratégies de pondération.

4.	Cliquez sur Appliquer. La nouvelle stratégie de pondération est appliquée à l’itération d’ajustement suivante.

5.	Cliquez sur OK. Le dialogue se ferme.


Modifier une valeur de paramètre de transformation

Vue d'ensemble et plus amples informations
ATTENTION : Faites extrêmement attention lorsque vous modifiez les champs de valeur de paramètres de transformation. Vous devez posséder une excellente connaissance de la théorie d’ajustement de réseau et des ajustements par la méthode des moindres carrés avant de tenter d’effectuer ces modifications.

NOTE : Les paramètres Rotation d’azimut, Echelle du réseau, Echelle de distance et Constante de distance ne sont pas utilisés pour les transformations de géoïde. Ces champs sont des observations terrestres et GPS qui peuvent être éditées.

Pour modifier une valeur de paramètre :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

5.	Sélectionnez le champ Valeur du paramètre de transformation désiré.

6.	Entrez la nouvelle valeur de paramètre.

Tenez compte des directives suivantes :

  Les valeurs angulaires sont entrées dans le format DDD.MMSSssss avec signe.

  Les valeurs linéaires sont entrées dans les Unités du projet avec signe.

Vous pouvez trouver des directives relatives à la modification de la Valeur et de l’Etat de paramètres de transformation individuels dans les rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

7.	Sélectionnez l’option Défini par l’utilisateur dans la liste Etat. Pour de plus amples informations, sélectionnez l’une des rubriques listées ci-dessus.

8.	Répétez les étapes 1 à 7 pour modifier d’autres valeurs de paramètres de transformation si nécessaire. Il se peut que vous deviez modifier les champs Valeur et Etat de plusieurs paramètres pour créer la transformation souhaitée.

9.	Cliquez sur OK.

Les modifications sont appliquées au groupe de transformation.


Annuler l'état fixe de points pour éliminer les contraintes des composants de coordonnées

Les paramètres d’Etat fixe utilisés pour contraindre des points individuels à un composant de coordonnées dans la liste Points peuvent être supprimés de manière sélective.

Pour supprimer les paramètres d’Etat fixe :

1.	Sélectionnez Ajustement / Points. Le dialogue Points s'affiche.

2.	Utilisez la barre de défilement pour trouver le point désiré.

3.	Sélectionnez le point.

4.	Dans le groupe d’options Fixe, supprimez les coches appropriées pour éliminer les contraintes de composant.

5.	Cliquez sur OK.

Les modifications sont appliquées au projet.


Copier des styles d'ajustement de réseau

Les styles existants peuvent être copiés pour créer un nouveau style. Les paramètres d’ajustement de réseau définis pour le nouveau style seront identiques à ceux du style d’origine. Une fois que le style a été copié, les paramètres d’ajustement peuvent être personnalisés.

Pour copier un style :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Cliquez sur Copier. Le dialogue Copier style s'affiche.

3.	Entrez le nom du nouveau style dans le champ Nom.

4.	Cliquez sur OK. Le dialogue Editer styles d’ajustement s'affiche.

5.	Editez les paramètres du style.

6.	Cliquez sur OK. Le nouveau style est enregistré.


Créer des styles d'ajustement de réseau

De nouveaux styles d’ajustement peuvent être créés de deux manières. Cette rubrique vous indique comment créer de nouveaux styles sur la base des paramètres du Style d’ajustement dans le style « Limites de confiance 95 % ».  Une seconde rubrique vous explique comment copier les paramètres d’un style existant dans un nouveau style.

ASTUCE : Le nouveau style peut être édité pour peaufiner les paramètres d’ajustement afin qu’ils répondent à vos besoins et permettre ainsi à ces paramètres d’être appliqués aux nouveaux styles au fur et à mesure de leur création.

Pour créer un nouveau style :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Cliquez sur Nouveau. Le dialogue Nouveau style s'affiche.

3.	Dans le champ Nom, entrez le nom du nouveau style. Les noms de style peuvent inclure jusqu’à 255 caractères mais les noms de fichier plus courts sont plus faciles à trouver dans la liste de styles.

4.	Cliquez sur OK. Le dialogue Editer styles d’ajustement s'affiche.

5.	Sélectionnez l’une des tabulations suivantes :

  Général

  Affichage de covariance

  Contrôles terrestres

  Erreurs d’installation

6.	Editez les contrôles de style désirés.

7.	Cliquez sur OK pour enregistrer le nouveau style.


Créer des groupes de transformation

 Vue d'ensemble et plus amples informations

Vous pouvez créer un ou plusieurs groupes de transformation pour un ajustement de réseau. Une fois qu’il a été créé, le groupe est ajouté à la liste Groupes.

NOTE : Il est possible de créer uniquement des nouveaux groupes de transformation d’observations GPS ou terrestres. Les groupes de transformation de géoïde multiples ne sont pas permis.

Pour créer un nouveau groupe :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Cliquez sur Nouveau. Le dialogue Editer groupes de transformation s'affiche.

4.	Entrez le nom du groupe dans le champ Nom.

5.	Cliquez sur OK. Le dialogue Editer groupes de transformation s'affiche avec ces options.

6.	Ajoutez des observations de la liste Observations disponibles dans la liste Observations du groupe.

7.	Définissez les paramètres de transformation pour les groupes ou configurez-les pour qu’ils soient calculés.

ASTUCE : Vous pouvez filtrer la liste afin que les types d’observations soient temporairement masqués, ce qui permet d’écourter la liste. Les listes plus courtes vous permettent de trouver les observations plus rapidement.

Pour filtrer des observations :

1.	Cliquez sur Filtrer. Le dialogue Filtre d’observation s'affiche. Au départ, les coches sont sélectionnées pour tous les types d’observations, ce qui rend toutes les observations visibles dans la liste Observations disponibles.

2.	Supprimez toute combinaison de cases à cocher pour masquer les types d’observations. L’action de filtrage affecte uniquement la session d’édition courante. Lorsque le dialogue se ferme, les filtres sont restaurés à leurs valeurs d’origine.

Pour ajouter une observation :

1.	Sélectionnez l’observation dans la liste Observations disponibles. Le bouton Ajouter devient disponible.

NOTE :  Le champ Transformation identifie les groupes de transformation déjà associés à des observations. Utilisez ce champ comme guide lorsque vous ajoutez des observations. Les observations individuelles peuvent être assignées à un seul groupe de transformation autre que <GPS par défaut> ou <Terr. par défaut>. Cependant, vous pouvez transférer les observations d’un groupe à un groupe actif en les sélectionnant et en cliquant sur Ajouter. Toutes les observations GPS demeurent assignées à <GPS par défaut> même lorsqu’elles sont ajoutées à un autre groupe de transformation. De même, toutes les observations terrestres demeurent assignées à <Terr. par défaut> même lorsqu’elles sont ajoutées à un autre groupe de transformation.

2.	Cliquez sur Ajouter.

L’observation est ajoutée à la liste Observations du groupe.

Pour supprimer des observations :

1.	Sélectionnez l’observation dans la liste Observations du groupe. Le bouton Supprimer devient disponible.

2.	Cliquez sur Supprimer.

L’observation est supprimée de la liste Observations du groupe.

NOTE : L’état des observations supprimées change dans la liste Observations disponibles. Le champ Transformation de l’observation est supprimé, ce qui permet à l’observation d’être ajoutée à d’autres groupes de transformation.

NOTE : Aucune observation ne peut être supprimée des groupes de transformation <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut>.

Pour définir les paramètres de transformation :

ATTENTION : Faites extrêmement attention lorsque vous modifiez une valeur ou l’état d’un paramètre de transformation. Vous devez posséder une excellente connaissance de la théorie d’ajustement de réseau et des ajustements par la méthode des moindres carrés avant de tenter d’effectuer ces modifications. Pour une liste de références afin d’en apprendre plus sur la théorie d’ajustement de réseau et les ajustements par la méthode des moindres carrés, référez-vous à la Bibliographie.

1.	Sélectionnez le champ Valeur du paramètre désiré.

2.	Editez le champ à l’aide des directives données dans l’une des rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

NOTE : Les paramètres de rotation d’azimut, d’échelle du réseau, d’échelle de distance et de constante de distance ne sont pas utilisés pour les transformations de géoïde.

3.	Sélectionnez l’option appropriée dans la liste Etat. Pour de plus amples informations, référez-vous à l’une des rubriques listées ci-dessus.

4.	Pour enregistrer les modifications, cliquez sur OK.


Créer des groupes de variance

De nouveaux groupes peuvent être créés à tout moment entre les ajustements.

NOTE : Vous pouvez créer de nouveaux groupes de variance uniquement pour les observations terrestres ou GPS. Les groupes de variance de géoïde multiples ne sont pas permis.

Pour créer des groupes de variance :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Cliquez sur Nouveau pour créer un Groupe de variance. Le dialogue Nouveau groupe de variance s'affiche.

4.	Entrez le nom du nouveau groupe.

5.	Cliquez sur OK. Le dialogue Editer groupes de variance s'affiche. La liste Observations disponibles est utilisée pour sélectionner l’observation à ajouter au nouveau groupe.

6.	Sélectionnez l’observation désirée.

ASTUCE : Cliquez sur Filtrer pour afficher le dialogue Filtre d'observation avec les options vous permettant de filtrer les types d’observations de la liste Observations disponibles.

7.	Cliquez sur Ajouter.

8.	Répétez les étapes 1 à 7 jusqu’à ce que vous ayez terminé de créer le groupe.

9.	Cliquez sur OK. Les modifications sont enregistrées dans le projet.


Définir des paramètres de transformation

Vue d'ensemble et plus amples informations
ATTENTION : Faites extrêmement attention lorsque vous modifiez les champs de valeur de paramètres de transformation. Vous devez posséder une excellente connaissance de la théorie d’ajustement de réseau et des ajustements par la méthode des moindres carrés avant de tenter d’effectuer ces modifications.

Pour modifier une valeur de paramètre :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

5.	Sélectionnez le champ Valeur du paramètre de transformation désiré.

6.	Entrez la nouvelle valeur de paramètre.

Tenez compte des directives suivantes :

  Les valeurs angulaires sont entrées dans le format DDD.MMSSssss avec signe.

  Les valeurs linéaires sont entrées dans les Unités du projet avec signe.

Vous pouvez trouver des directives relatives à la modification des paramètres de transformation individuels Statut et Etat dans les rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

NOTE : Les paramètres Rotation d’azimut, Echelle du réseau, Echelle de distance et Constante de distance ne sont pas utilisés pour les transformations de géoïde.

7.	Sélectionnez le paramètre de transformation Etat dans la liste. Pour de plus amples informations, référez-vous à l’une des rubriques listées ci-dessus.

8.	Répétez les étapes 2 à 7 pour modifier d’autres valeurs de paramètres de transformation si nécessaire.

Il se peut que vous deviez modifier les champs Valeur et Etat de plusieurs paramètres pour créer la transformation souhaitée.

9.	Cliquez sur OK.

Les modifications sont appliquées au groupe de transformation.


Supprimer des groupes de transformation

 Vue d'ensemble et plus amples informations

Les groupes de transformation définis par l’utilisateur peuvent être supprimés s’ils ne sont plus requis. Lorsqu’il est supprimé, le groupe est retiré du projet et n’est plus disponible.

NOTE : Les groupes de transformation <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut> ne peuvent pas être supprimés. Le bouton Supprimer est automatiquement désactivé lorsque aucun groupe autre que les groupes par défaut n’est listé.

Pour supprimer un groupe :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe.

4.	Cliquez sur Supprimer. Un message de vérification s’affiche pour confirmer l’action.

5.	Cliquez sur OK.


Supprimer des groupes de variance

 Vue d'ensemble et plus amples informations

Les groupes de variance peuvent être supprimés lorsqu’ils ne sont plus requis. Les groupes de variance supprimés sont retirés du projet et ne sont plus disponibles.

NOTE : Les groupes de variance <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut> ne peuvent pas être supprimés. Le bouton Supprimer est automatiquement désactivé lorsque aucun groupe autre que les groupes par défaut n’est listé.

Pour supprimer un groupe :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Supprimer. Un message de vérification confirme l’action.

5.	Cliquez sur OK.


Supprimer des styles d'ajustement de réseau

Les styles d’ajustement de réseau peuvent être supprimés lorsqu’ils ne sont plus requis. Lorsqu’il est supprimé, le style est retiré du projet et n’est plus disponible.

NOTE : Au moins un style doit figurer dans la liste de styles. Le bouton Supprimer est automatiquement désactivé lorsqu’un seul style figure dans la liste. Si vous souhaitez supprimer le dernier style et le remplacer par un autre, cliquez sur Nouveau pour créer un nouveau style. Les nouveaux styles sont basés sur le style « Limites de confiance 95 % »  Pour de plus amples informations, référez-vous à Création de styles d’ajustement de réseau.

Pour supprimer un style :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez le style dans la liste de styles.

3.	Cliquez sur Supprimer. Un message de vérification s’affiche et confirme l’action.

4.	Cliquez sur OK.


Désactiver des observations d'ajustements ou de recalculs

 Vue d'ensemble et plus amples informations

Si vous ne souhaitez pas utiliser une observation dans un ajustement de réseau ou un recalcul, vous avez la possibilité de la désactiver. La désactivation d’une observation entraîne sa suppression du dialogue Observations mais ne supprime pas ses données de votre projet de manière permanente.

Vous pouvez désactiver une observation de deux manières.

Pour désactiver des observations à partir du dialogue Observations :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Faites défiler jusqu’à l’observation désirée.

ASTUCE : Vous pouvez filtrer les observations dans la liste Observations disponibles afin d’afficher ou de masquer des types d’observations sélectionnés et de faciliter ainsi la recherche d’une observation.

4.	Cliquez avec le bouton droit de la souris sur l’observation pour accéder au menu de raccourcis puis sélectionnez Désactiver. L’observation est supprimée de la liste et ne sera plus utilisée pour les ajustements de réseau ou recalculs ultérieurs.

Les observations désactivées sont indiquées en rouge dans la fenêtre graphique.

5.	Cliquez sur OK pour enregistrer les modifications dans le projet.

Pour désactiver des observations à partir de la fenêtre graphique :

1.	Cliquez deux fois sur l’observation. La fenêtre Propriétés s’affiche.

2.	Cliquez sur le bouton de menu de la page Résumé [image]. La page Résumé s’affiche.

3.	Dans la liste Etat, sélectionnez Désactiver.

Lorsque vous souhaitez réactiver des observations désactivées, vous devez éditer les propriétés d’observation dans la fenêtre graphique.

NOTE : La désactivation d’une observation n’équivaut pas à l’exclusion d’une observation. Comme c’est le cas pour les observations désactivées, les observations exclues ne sont pas utilisées dans les ajustements de réseau ni dans les recalculs. Cependant, elles continuent de figurer dans la liste Observations. Les données d’observation ne sont pas supprimées du projet de manière permanente, vous pouvez donc à nouveau utiliser une observation exclue précédemment.


Editer des options de style d'ajustement de l'affichage de covariance

 Vue d'ensemble et plus amples informations

Les paramètres de l’Affichage de covariance peuvent être édités à tout moment entre les ajustements.

Pour éditer les paramètres de l’Affichage de covariance :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Dans la tabulation Style de covariance, éditez les options suivantes le cas échéant :

  Horizontal

  En trois dimensions

5.	Après avoir édité ces options, cliquez sur OK. Les modifications sont appliquées au style d’ajustement.


Editer des options générales de style d'ajustement

Les options sous Général peuvent être éditées à tout moment entre les ajustements.

Pour éditer les paramètres sous Général :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Dans la tabulation Général, sélectionnez ou désélectionnez les coches suivantes :

  Utiliser profil de colonne réduit

  Limiter les termes de covariance aux lignes observées

  Calculer les corrélations du modèle de géoïde

5.	Editez les options de Tolérances résiduelles.

6.	Editez les options de Scalaires sigma.

7.	Entrez une nouvelle valeur dans le champ Itérations maximum.

8	Cliquez sur OK pour enregistrer les modifications.


Editer des options de style des contrôles terrestres

 Vue d'ensemble et plus amples informations

Les options sous Contrôles terrestres peuvent être éditées à tout moment entre les ajustements.

Pour cela :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Dans la tabulation Contrôles terrestres, éditez les valeurs d’erreur standard pour les mesures appropriées.

5.	Sélectionnez ou désélectionnez la case à cocher Effectuer ajustement vertical. Cette option est sélectionnée lorsque vous ajustez un cheminement 3D ou des données de niveau.

6. 	Sélectionnez ou désélectionnez la case à cocher Effectuer ajustement horizontal. Cette option est sélectionnée lorsque vous ajustez un cheminement 2D.

7. 	Cliquez sur OK pour enregistrer les modifications.


Editer des groupes de transformation

 Vue d'ensemble et plus amples informations

Plusieurs opérations peuvent être effectuées lorsque vous éditez un groupe de transformation GPS ou terrestre. Elles comprennent notamment l’ajout d’observations au groupe, la suppression d’observations du groupe et la définition de paramètres de transformation. L’édition du groupe de transformation de géoïde est limitée à la définition de paramètres de transformation.

Pour éditer le groupe de transformation GPS, terrestre ou de géoïde :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe de transformation.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

5.	Ajoutez ou supprimez des observations (voir ci-dessous). (GPS ou terrestres uniquement)

6.	Définissez les paramètres de transformation (voir ci-dessous) et configurez-les pour le calcul. (GPS, terrestre ou de géoïde)

Pour filtrer les observations d’un groupe de transformation GPS :

1.	Cliquez sur Filtrer. Le dialogue Filtre d'observation s'affiche. Au départ, les coches sont sélectionnées pour tous les types d’observations, ce qui rend toutes les observations visibles dans la liste Observations disponibles.

2.	Supprimez toute combinaison de cases à cocher pour masquer les types d’observations. L’action de filtrage affecte uniquement la session d’édition courante. Lorsque le dialogue se ferme, les filtres sont restaurés à leurs valeurs d’origine.

Pour ajouter une observation GPS ou terrestre :

1.	Sélectionnez l’observation dans la liste Observations disponibles. L’observation est mise en évidence et le bouton Ajouter devient disponible.

NOTE :  Le champ Transformation de la liste Observations disponibles identifie les groupes de transformation déjà associés à des observations. Utilisez ce champ comme guide lorsque vous ajoutez des observations. Les observations individuelles ne peuvent être assignées qu’à un seul groupe de transformation.

2.	Cliquez sur Ajouter.

L’observation est ajoutée à la liste Observations du groupe.

Pour supprimer des observations GPS ou terrestres d’un groupe de transformation :

1.	Sélectionnez l’observation dans la liste Observations du groupe. L’observation est mise en évidence et le bouton Supprimer devient disponible.

2.	Cliquez sur Supprimer. L’observation est supprimée de la liste Observations du groupe.

NOTE : Aucune observation ne peut être supprimée des groupes de transformation <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut>.

NOTE : L’état des observations supprimées change dans la liste Observations disponibles. Le champ Transformation de l’observation est supprimé, ce qui permet à l’observation d’être ajoutée à d’autres groupes de transformation.

Pour définir les paramètres de transformation d’un groupe de transformation GPS, terrestre ou de géoïde :

ATTENTION : Faites extrêmement attention lorsque vous modifiez une valeur ou l’état d’un paramètre de transformation. Vous devez posséder une excellente connaissance de la théorie d’ajustement de réseau et des ajustements par la méthode des moindres carrés avant de tenter d’effectuer ces modifications. Pour une liste de références afin d’en apprendre plus sur la théorie d’ajustement de réseau et les ajustements par la méthode des moindres carrés, référez-vous à la Bibliographie.

1.	Sélectionnez le champ Valeur du paramètre désiré.

2.	Editez le champ à l’aide des directives données dans l’une des rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

NOTE : Les paramètres Rotation d’azimut, Echelle du réseau, Echelle de distance et Constante de distance ne sont pas utilisés pour les transformations de géoïde.

3.	Sélectionnez l’option appropriée dans la liste Etat. Pour de plus amples informations, référez-vous à l’une des rubriques listées ci-dessus.

4.	Cliquez sur OK pour enregistrer les modifications dans le projet.


Editer des groupes de variance

 Vue d'ensemble et plus amples informations

Les groupes de variance peuvent être édités entre les ajustements.

NOTE : Le bouton Editer du groupe de transformation de géoïde par défaut vous permet d’afficher le groupe uniquement.

Pour éditer un groupe :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Editer. Le dialogue Editer groupes de variance s'affiche. La liste Observations du groupe indique les observations du groupe, et la liste Observations disponibles indique toutes les observations d’ajustement de réseau activées.

Pour ajouter des observations :

1.	Sélectionnez une observation dans la liste Observations disponibles. L’observation est mise en évidence et le bouton Ajouter devient disponible.

2.	Cliquez sur Ajouter.

L’observation est ajoutée à la liste Observations du groupe et supprimée de la liste Observations disponibles.

Pour supprimer des observations :

1.	Sélectionnez l’observation dans la liste Observations du groupe. L’observation est mise en évidence et le bouton Supprimer devient disponible.

2.	Cliquez sur Supprimer.

L’observation est supprimée du groupe et placée dans la liste Observations disponibles.

Pour enregistrer les observations :

  Cliquez sur OK.

Les modifications sont enregistrées dans le projet.


Editer des coordonnées de la liste Points

 Vue d'ensemble et plus amples informations

Vous pouvez éditer les coordonnées d’un point de la liste Points entre les ajustements.

1.	Sélectionnez Ajustement / Points. Le dialogue Points s'affiche.

2.	Utilisez la barre de défilement pour trouver le point à éditer.

3.	Sélectionnez le composant de coordonnées à éditer.

Lorsqu’un composant de coordonnées est édité, la case à cocher du composant (dans le groupe Fixe) est sélectionnée automatiquement.

Lorsqu’un composant du groupe Fixe est désélectionné, le composant de coordonnées reprend la valeur qui était enregistrée dans le champ avant l’édition.

4.	Répétez les étapes précédentes pour éditer des points supplémentaires.

5.	Une fois que vous avez terminé l’édition, cliquez sur OK.

Les modifications sont enregistrées dans le projet dans le format d’affichage sélectionné (c.-à-d. WGS-84, grille ou local).


Editer des stratégies de pondération

Vue d'ensemble et plus amples informations
Les stratégies de pondération peuvent être définies et appliquées entre les ajustements.

Pour éditer des stratégies de pondération :

1.	Sélectionnez Ajustement / Stratégies de pondération. Le dialogue Stratégies de pondération s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde. La liste Observations GPS, terrestres ou de géoïde s’affiche.

3.	Configurez l’option Appliquer scalaires à sur Toutes les observations, Chaque observation ou Groupes de variance.

NOTE : Toutes les observations est la seule option disponible pour un groupe de transformation de géoïde.

4.	Effectuez l'une des opérations suivantes :

  Si vous avez sélectionné Toutes les observations ou Chaque observation à l’étape précédente, passez directement à l’étape 6.

  Si vous avez sélectionné Groupes de variance, passez à l’étape 5.

NOTE : Si vous avez sélectionné le bouton Chaque observation, le type de scalaire Défini par l’utilisateur n’est pas disponible.

5.	Si vous avez sélectionné Groupes de variance à l’étape 3, la liste Observations est remplacée par la liste Groupes et tous les groupes de variance sont affichés. Effectuez les opérations suivantes :

a.	Configurez Type de scalaire sur Défaut, Alternatif, Défini par l’utilisateur ou Automatique.

b.	Effectuez l'une des opérations suivantes :

  Si vous avez sélectionné Défaut, Alternatif ou Automatique, passez directement à l’étape 8.

  Si vous avez sélectionné Défini par l’utilisateur, le curseur s’affiche dans le champ Scalaire de la liste Groupes et vous pouvez alors entrer une Valeur scalaire.

c.	Après avoir entré une Valeur scalaire, passez à l’étape 8.

6.	Configurez Type de scalaire sur Défaut, Alternatif, Défini par l’utilisateur ou Automatique.

7.	Effectuez l'une des opérations suivantes :

  Si vous avez sélectionné Défaut, Alternatif ou Automatique, passez directement à l’étape 8.

  Si vous avez sélectionné Défini par l’utilisateur, le champ Valeur scalaire devient disponible vous permettant ainsi d’entrer une Valeur scalaire. Entrez la valeur et passez à l’étape suivante.

8.	Cliquez sur OK ou sur Appliquer.

Les modifications sont enregistrées.


Editer des options de style d'ajustement des erreurs d'installation

 Vue d'ensemble et plus amples informations

Les options sous Erreurs d’installation peuvent être éditées à tout moment entre les ajustements.

Pour éditer les options sous Erreurs d’installation :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez un style dans la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer styles d’ajustement s'affiche.

4.	Sélectionnez la tabulation Erreurs d’installation. Les options d’Erreurs d’installation s’affichent. Si nécessaire, effectuez l’une des opérations suivantes :

a.	Entrez une nouvelle valeur dans le champ Erreur dans la hauteur d’antenne ou Erreur dans la hauteur d’instrument.

b.	Entrez les nouvelles valeurs dans les champs Erreur de centrage.

5.	Après avoir effectué ces modifications, cliquez sur OK.

Les modifications sont enregistrées.


Inclure des observations dans un ajustement

 Vue d'ensemble et plus amples informations

Les observations qui ont précédemment été exclues d’ajustements de réseau peuvent être incluses à nouveau.

Pour inclure des observations :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde. La liste Observations s’affiche.

3.	Utilisez la barre de défilement pour trouver les observations.

4.	Sélectionnez les cases à cocher de la colonne Utiliser pour inclure des observations dans l’ajustement de réseau.

ASTUCE : Vous pouvez utiliser la touche « majuscules » ou la touche de contrôle pour sélectionner des observations multiples.

5.	Cliquez sur OK.

Les modifications sont enregistrées dans le projet.

NOTE : Pour de plus amples informations sur l’exclusion d’observations d’un ajustement, référez-vous à Exclusion d’observations.

NOTE : Les observations peuvent également être désactivées ou réactivées. Pour de plus amples informations, référez-vous à Désactivation d’observations et Réactivation d’observations désactivées.

NOTE : Vous pouvez utiliser la fenêtre Propriétés pour inclure des observations dans un ajustement. Pour cela, sélectionnez la case à cocher Utiliser dans ajustement de réseau de la page Résumé.


Evaluer le Rapport d'ajustement de réseau

 Vue d'ensemble et plus amples informations

Les résultats sont affichés dans le Rapport d’ajustement de réseau au fur et à mesure des ajustements successifs. Sur la base de l’évaluation des résultats du rapport, des mesures sont prises pour progressivement amener le réseau à converger. Ces mesures peuvent nécessiter la modification des styles d’ajustement, l’inclusion ou l’exclusion d’observations, l’activation ou la désactivation d’observations, le chargement des séparations de géoïde, la création de groupes de transformation à appliquer aux groupes d’observations, la création de groupes de variance, l’application de stratégies de pondération, la contrainte de points de contrôle à des composants de coordonnées ainsi que d’autres mesures.

Pour évaluer un rapport :

1.	Sélectionnez Rapports / Rapport d’ajustement de réseau. Le rapport est généré et l’afficheur HTML par défaut de votre ordinateur est lancé, ce qui vous permet d’afficher le rapport à l’aide de l’afficheur.

2.	Naviguez dans le rapport pour afficher certaines statistiques et évaluer les résultats.

Les rubriques suivantes vous donnent des directives générales pour l’évaluation des statistiques du rapport. Pour des informations plus détaillées, référez-vous à la Bibliographie.

Les directives pour l’évaluation des sections du rapport sont comprises dans les rubriques suivantes :

  Paramètres de style d’ajustement

  Tolérances résiduelles

  Affichage de covariance

  Contrôles terrestres

  Erreurs d’installation

  Résumé statistique

  Nombre d’itérations

  Statistiques globales

  Statistiques d’observations GPS

  Statistiques du modèle de géoïde

  Statistiques d’observations terrestres

  Stratégies de pondération

  Coordonnées ajustées

  Coordonnées de grille

  Coordonnées géodésiques

  Delta de coordonnées

  Comparaisons de coordonnées de contrôle

  Observations ajustées

  Observations GPS

  Observations de géoïde

  Observations terrestres

  Histogrammes des résidus standardisés

  Ellipses d’erreur de point

  Valeurs de covariance


Filtrer des observations

 Vue d'ensemble et plus amples informations

Le filtrage s’avère utile lors de l’affichage d’un grand nombre de types d’observations terrestres ou GPS. Vous pouvez temporairement filtrer les observations pour la durée durant laquelle le dialogue Observations est ouvert. L’action de filtrage a pour effet de masquer les types d’observations sélectionnés, ce qui donne l’impression que la liste est moins longue. Lorsque la liste Observations est filtrée, le terme « Filtré » apparaît dans le titre du dialogue. Au moment où vous quittez le dialogue, les observations filtrées sont supprimées.

Pour filtrer des observations :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre. La liste Observations s’affiche.

3.	Cliquez sur Filtrer. Le dialogue Filtre d'observation s'affiche.

4.	Sélectionnez ou désélectionnez les cases à cocher requises. Par défaut, toutes les cases à cocher du filtre sont sélectionnées.

Dans le filtre d’observation terrestre, laissez toutes les observations sélectionnées à moins que vous ne soyez sûr des types d’observations que vous souhaitez sélectionner. Si vous sélectionnez une option, cela équivaut à sélectionner une observation partielle. Par exemple, si vous sélectionnez le filtre de distance d’ellipsoïde, alors vous ne pouvez visualiser que les observations contenant une distance d’ellipsoïde. Vous ne pouvez pas visualiser d’observations avec un angle horizontal et une distance d’ellipsoïde à moins que vous ne sélectionniez ces deux options de filtrage.

  Si vous sélectionnez la case à cocher Azimut et désélectionnez les cases à cocher des autres observations, seules les observations avec des azimuts saisis au clavier sont affichées.

  Si vous sélectionnez la case à cocher Delta élévation et désélectionnez les cases à cocher des autres observations, les données de niveau sont sélectionnées.

  Si vous souhaitez afficher des observations brutes, sélectionnez les cases à cocher Angle horizontal, Distance d’ellipsoïde et Elévation trigonométrique.

5.	Cliquez sur OK. Les types d’observations sélectionnés sont masqués dans l’affichage mais sont toujours utilisés dans l’ajustement de réseau.


Filtrer des observations de pondération scalaire

Vue d'ensemble et plus amples informations
Le filtrage s’avère utile lors de l’affichage d’un grand nombre d’observations diverses terrestres ou GPS. Vous pouvez temporairement filtrer des observations pour la durée durant laquelle le dialogue est ouvert. L’action de filtrage a pour effet de masquer les types d’observations sélectionnés, ce qui donne l’impression que la liste est moins longue. Lorsque la liste Observations est filtrée, le terme « Filtré » apparaît dans le titre du dialogue. Au moment où vous quittez le dialogue, les observations filtrées sont supprimées.

Pour filtrer des observations :

1.	Sélectionnez Ajustement / Stratégies de pondération. Le dialogue Stratégies de pondération s’affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre. La liste Observations s’affiche.

3.	Cliquez sur Filtrer. Le dialogue Filtre d'observation s'affiche. Par défaut, toutes les cases à cocher du filtre sont sélectionnées.

4.	Sélectionnez les cases à cocher désirées pour filtrer la liste Observations disponibles. La sélection d’une case à cocher entraîne la suppression de la coche. La désélection de toutes les coches a pour conséquence de masquer toutes les observations.

Dans le filtre d’observation terrestre, laissez toutes les observations sélectionnées à moins que vous ne soyez sûr des types d’observations que vous souhaitez sélectionner. Si vous sélectionnez une option, cela équivaut à sélectionner une observation partielle. Par exemple, si vous sélectionnez le filtre de distance d’ellipsoïde, alors vous ne pouvez visualiser que les observations contenant une distance d’ellipsoïde. Vous ne pouvez pas visualiser d’observations avec un angle horizontal et une distance d’ellipsoïde à moins que vous ne sélectionniez ces deux options de filtrage.

  Si vous sélectionnez la case à cocher Azimut et désélectionnez les cases à cocher des autres observations, seules les observations avec des azimuts saisis au clavier sont affichées.

  Si vous sélectionnez la case à cocher Delta élévation et désélectionnez les cases à cocher des autres observations, les données de niveau sont sélectionnées.

  Si vous souhaitez afficher des observations brutes, sélectionnez les cases à cocher Angle horizontal, Distance d’ellipsoïde et Elévation trigonométrique.

5.	Cliquez sur OK. Les types d’observations sélectionnés sont masqués dans l’affichage mais sont toujours utilisés dans l’ajustement de réseau.


Filtrer des observations du groupe de transformation

Vue d'ensemble et plus amples informations
Le filtrage s’avère utile lors de l’affichage d’un grand nombre d’observations diverses terrestres ou GPS. Vous pouvez temporairement filtrer des observations pour la durée durant laquelle le dialogue est ouvert. L’action de filtrage a pour effet de masquer les types d’observations sélectionnés, ce qui donne l’impression que la liste est moins longue. Lorsque la liste Observations est filtrée, le terme « Filtré » apparaît dans le titre du dialogue. Au moment où vous quittez le dialogue, les observations filtrées sont supprimées.

Pour filtrer des observations :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre. La liste Observations disponibles s’affiche.

3.	Cliquez sur Filtrer. Le dialogue Filtre d'observation s'affiche. Par défaut, toutes les cases à cocher du filtre sont sélectionnées.

4.	Sélectionnez les cases à cocher désirées pour filtrer la liste Observations disponibles. La sélection d’une case à cocher entraîne la suppression de la coche. La désélection de toutes les coches a pour conséquence de masquer toutes les observations.

Dans le filtre d’observation terrestre, laissez toutes les observations sélectionnées à moins que vous ne soyez sûr des types d’observations que vous souhaitez sélectionner. Si vous sélectionnez une option, cela équivaut à sélectionner une observation partielle. Par exemple, si vous sélectionnez le filtre de distance d’ellipsoïde, alors vous ne pouvez visualiser que les observations contenant une distance d’ellipsoïde. Vous ne pouvez pas visualiser d’observations avec un angle horizontal et une distance d’ellipsoïde à moins que vous ne sélectionniez ces deux options de filtrage.

  Si vous sélectionnez la case à cocher Azimut et désélectionnez les cases à cocher des autres observations, seules les observations avec des azimuts saisis au clavier sont affichées.

  Si vous sélectionnez la case à cocher Delta élévation et désélectionnez les cases à cocher des autres observations, les données de niveau sont sélectionnées.

  Si vous souhaitez afficher des observations brutes, sélectionnez les cases à cocher Angle horizontal, Distance d’ellipsoïde et Elévation trigonométrique.

5.	Cliquez sur OK.

Les types d’observations sélectionnés sont masqués dans l’affichage mais sont toujours utilisés dans l’ajustement de réseau.


Filtrer des observations du groupe de variance

 Vue d'ensemble et plus amples informations

Le filtrage s’avère utile lors de l’affichage d’un grand nombre d’observations diverses GPS. Vous pouvez temporairement filtrer des observations pour la durée durant laquelle le dialogue est ouvert. L’action de filtrage a pour effet de masquer les types d’observations sélectionnés, ce qui donne l’impression que la liste est moins longue. Lorsque la liste Observations est filtrée, le terme « Filtré » apparaît dans le titre du dialogue. Au moment où vous quittez le dialogue, les observations filtrées sont supprimées.

Pour filtrer des observations :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre. La liste Observations disponibles s’affiche.

3.	Cliquez sur Filtrer. Le dialogue Filtre d'observation s'affiche. Par défaut, toutes les cases à cocher du filtre sont sélectionnées.

4.	Sélectionnez les cases à cocher désirées pour filtrer la liste Observations disponibles. La sélection d’une case à cocher entraîne la suppression de la coche. La désélection de toutes les coches a pour conséquence de masquer toutes les observations.

Dans le filtre d’observation terrestre, laissez toutes les observations sélectionnées à moins que vous ne soyez sûr des types d’observations que vous souhaitez sélectionner. Si vous sélectionnez une option, cela équivaut à sélectionner une observation partielle. Par exemple, si vous sélectionnez le filtre de distance d’ellipsoïde, alors vous ne pouvez visualiser que les observations contenant une distance d’ellipsoïde. Vous ne pouvez pas visualiser d’observations avec un angle horizontal et une distance d’ellipsoïde à moins que vous ne sélectionniez ces deux options de filtrage.

  Si vous sélectionnez la case à cocher Azimut et désélectionnez les cases à cocher des autres observations, seules les observations avec des azimuts saisis au clavier sont affichées.

  Si vous sélectionnez la case à cocher Delta élévation et désélectionnez les cases à cocher des autres observations, les données de niveau sont sélectionnées.

  Si vous souhaitez afficher des observations brutes, sélectionnez les cases à cocher Angle horizontal, Distance d’ellipsoïde, et Elévation trigonométrique.

5.	Cliquez sur OK.

Les types d’observations sélectionnés sont masqués dans l’affichage mais sont toujours utilisés dans l’ajustement de réseau.


Charger des séparations de géoïde

 Vue d'ensemble et plus amples informations

Avant de calculer des élévations pour des points ou de fixer des élévations, un modèle de géoïde doit être assigné au projet et des séparations de géoïde chargées dans le projet.

Généralement, les séparations de géoïde sont chargées après la production de coordonnées pour chaque point à l’aide d’un ajustement contraint complètement effectué en utilisant le datum pour lequel le modèle de géoïde est défini.

NOTE : Ce fichier d’aide utilise le terme d’observations de géoïde pour décrire les séparations de géoïde utilisées dans les ajustements de réseau. Les observations de géoïde sont chargées dans le projet mais sont utilisées uniquement pour les ajustements.

Pour charger des séparations de géoïde :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation Géoïde.

3.	Effectuez l'une des opérations suivantes :

  Si des séparations de géoïde ont été chargées précédemment, les observations sont affichées dans la liste Observations et vous pouvez arrêter cette procédure à ce stade.

  Si la liste Observations est vide, les séparations de géoïde ne sont pas chargées dans le projet et vous devez terminer cette procédure.

4.	Cliquez sur Charger. Les séparations de géoïde de tous les points correspondants sont chargées dans le projet et affichées dans la liste Observations.

NOTE : Le bouton Charger est désactivé si aucun modèle de géoïde n’est défini pour le projet.

NOTE : Les observations de géoïde sont interpolées à la position du point courant. Si les positions de point ont changé significativement, vous devez recharger les observations de géoïde.

5.	Cliquez sur OK.

Les modifications sont enregistrées.


Déplacer les colonnes d'une liste

 Vue d'ensemble et plus amples informations

Les colonnes d’une liste Observations peuvent être déplacées et mises à un autre emplacement de la liste.

Pour déplacer des colonnes :

1.	Quel que soit le type de liste d’observations, placez le curseur sur le libellé de la colonne. Le libellé contient le titre de la colonne et se trouve au-dessus de la première ligne de données.

2.	Effectuez l'une des opérations suivantes :

  Pour déplacer la colonne vers la droite, faites glisser le libellé jusqu’à ce que son côté gauche se trouve juste après la position à laquelle vous souhaitez insérer la colonne puis relâchez le bouton de la souris.

  Pour déplacer la colonne vers la gauche, faites glisser le libellé jusqu’à ce que son côté droit se trouve juste après la position à laquelle vous souhaitez insérer la colonne puis relâchez le bouton de la souris.


Naviguer dans le Rapport d'ajustement de réseau

 Vue d'ensemble et plus amples informations

Une fois que vous avez affiché un rapport dans l’afficheur HTML par défaut de votre ordinateur, utilisez les commandes de l’afficheur pour naviguer dans le rapport.

Suivez les directives suivantes :

  Utilisez les hyperliens de la Table des matières pour vous rendre dans des sections individuelles du rapport.

  Utilisez la commande de l’afficheur HTML pour retourner en haut d’une page. La plupart des afficheurs possèdent un bouton Retour à cette fin.

  Utilisez les touches page précédente et page suivante ou les barres de défilement pour naviguer jusqu’à des sections particulières du rapport.

  Appuyez sur Alt+Tab pour passer du logiciel Trimble Geomatics Office à l’afficheur HTML et vice versa.


Supprimer un ajustement de réseau

 Vue d'ensemble et plus amples informations

Utilisez cette commande pour restaurer votre réseau à la configuration qu’il avait avant que l’ajustement ne commence.

Pour supprimer les valeurs ajustées, sélectionnez Ajustement / Supprimer ajustement.

Lorsque vous utilisez cette commande :

  le datum est configuré sur WGS-84

  aucun point n’a un état fixe

  les ellipses d’erreur sont supprimées

  les observations de géoïde sont déchargées

  s’il existait une calibration avant l’ajustement de réseau, elle est appliquée à nouveau

  les coordonnées ajustées sont supprimées

NOTE : Les observations qui étaient désactivées pour l’ajustement ne sont pas restaurées.


Supprimer des coordonnées de calibration

 Vue d'ensemble et plus amples informations

Les coordonnées de calibration enregistrées dans le projet après un ajustement contraint imperceptiblement peuvent être supprimées.

Pour supprimer des coordonnées de calibration, sélectionnez Ajustement / Coordonnées de calibration / Supprimer.

Les coordonnées de calibration sont supprimées du projet.


Supprimer des observations d'un groupe de transformation

 Vue d'ensemble et plus amples informations

Des observations peuvent être supprimées d’un groupe de transformation terrestre ou GPS créé par l’utilisateur.

NOTE : Aucune observation ne peut être supprimée du groupe de transformation <Géoïde par défaut>.

Pour supprimer les observations d’un groupe de transformation GPS :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Sélectionnez un groupe.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

5.	Dans la liste Observations du groupe, sélectionnez l’observation désirée. Le bouton Supprimer devient disponible.

6.	Cliquez sur Supprimer. L’observation est supprimée du groupe et s’affiche dans la liste Observations disponibles.

7.	Cliquez sur OK.

Les modifications sont enregistrées dans le projet.


Supprimer des observations d'un groupe de variance

 Vue d'ensemble et plus amples informations

Des observations peuvent être supprimées d’un groupe de variance terrestre ou GPS.

NOTE : Aucune observation ne peut être supprimée du groupe de variance <Géoïde par défaut>.

Pour supprimer des observations :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Editer. Le dialogue Editer groupes de variance s'affiche.

5.	Sélectionnez l’observation désirée dans la liste Observations du groupe. L’observation est mise en évidence et le bouton Supprimer devient disponible.

6.	Cliquez sur Supprimer. L’observation est supprimée du groupe et placée dans la liste Observations disponibles.

ASTUCE : Vous pouvez filtrer la liste Observations disponibles. L’action de filtrage a pour effet de masquer les types d’observations sélectionnés, ce qui donne l’impression que la liste est moins longue. Avec moins d’observations affichées dans la liste, vous pouvez trouver les observations plus rapidement.

7.	Cliquez sur OK pour appliquer les changements.


Renommer des styles d'ajustement de réseau

 Vue d'ensemble et plus amples informations

Les styles d’ajustement peuvent être renommés à tout moment entre les ajustements.

Pour renommer un style :

1.	Sélectionnez Ajustement / Styles d’ajustement. Le dialogue Styles d’ajustement de réseau s'affiche.

2.	Sélectionnez le style désiré dans la liste de styles.

3.	Cliquez sur Renommer. Le dialogue Renommer style s'affiche.

4.	Entrez le nouveau nom du style dans le champ Nom.

5.	Cliquez sur OK.

Les modifications sont enregistrées et vous retournez au dialogue Styles d’ajustement de réseau.


Redimensionner des colonnes de liste

 Vue d'ensemble et plus amples informations

La taille des colonnes de la liste Observations peut être modifiée pour afficher ou masquer certaines informations.

Pour redimensionner une colonne :

1.	Déplacez le curseur à droite du libellé de la colonne désirée jusqu’à ce que le curseur de redimensionnement s’affiche. Le libellé contient le titre de la colonne et se trouve au-dessus de la première ligne de données.

2.	Faites glisser le libellé de la colonne vers la gauche ou la droite jusqu’à ce qu’il atteigne la largeur désirée. La largeur de la colonne augmente ou diminue selon les mouvements du libellé.

La colonne est maintenant redimensionnée.


Enregistrer des coordonnées de calibration

 Vue d'ensemble et plus amples informations

Après avoir effectué avec des données GPS un ajustement contraint imperceptiblement sur un datum WGS-84 et établi des coordonnées WGS-84 pour chaque point de l’ajustement de réseau, vous pouvez utiliser les coordonnées en question comme coordonnées GPS observées pour une calibration du site.

Les coordonnées de calibration consistent en des Latitudes, Longitudes et Hauteurs d’ellipsoïde WGS-84.

NOTE : Cette commande est disponible uniquement lorsque WGS-84 est sélectionné comme datum de votre ajustement et lorsque l’ajustement a été effectué à l’aide de données GPS.

Pour enregistrer des coordonnées de calibration :

1.	Sélectionnez Ajustement / Coordonnées de calibration / Enregistrer. Le dialogue Enregistrer coordonnées de calibration s'affiche.

2.	Sélectionnez l’option Créer coordonnées sous points existants ou l’option Créer coordonnées sous nouveaux points avec suffixe.

3.	Cliquez sur OK.

Les coordonnées de calibration sont enregistrées et peuvent être affichées dans la fenêtre Propriétés.


Sélectionner le datum pour un ajustement

 Vue d'ensemble et plus amples informations

Lors d’un ajustement, vous avez la possibilité de configurer la définition de datum des résultats d’ajustement. Ce paramètre ne modifie pas le datum du projet configuré dans le dialogue Propriétés du projet. Lors d’un ajustement GPS contraint imperceptiblement, vous configurez généralement le datum sur WGS-84. Avant un ajustement contraint imperceptiblement de données terrestres, vous configurez le datum sur Datum du projet. Une fois que vous êtes prêt à effectuer l’ajustement contraint imperceptiblement, vous configurez votre datum sur votre datum de projet.

1.	Pour afficher le sous-menu Datum, sélectionnez Ajustement / Datum. Un menu s’affiche avec les options suivantes :

  WGS-84

  Datum  du projet − <nom du datum>

2.	Sélectionnez le datum.


Configurer l'état fixe pour contraindre des coordonnées

Les paramètres sous Fixe sont utilisés pour contraindre les composants de coordonnées des points inclus dans l’ajustement de réseau.

NOTE : Lorsque vous fixez un composant de coordonnées d’un point (2D, Hauteur, Elév) dans le dialogue Points, une coordonnée ajustée est créée. Vous pouvez afficher les coordonnées ajustées dans la fenêtre Propriétés.

Pour configurer les paramètres sous Fixe :

1.	Sélectionnez Ajustement / Points. Le dialogue Points s'affiche.

2.	Utilisez la barre de défilement pour trouver le point désiré puis sélectionnez le point.

3.	Lorsque vous éditez un composant de coordonnées, celui-ci est automatiquement fixé dans le groupe d’options Fixe.

NOTE : Vous pouvez identifier les points pour lesquels des coordonnées de contrôle sont déjà entrées (NE, é, h) en consultant la colonne fixe. Les parenthèses indiquent que le point n’a pas encore été fixé.

NOTE : Si vous supprimez un composant de coordonnées déjà fixé, il reprend l’ancienne valeur de coordonnées (c.-à-d. qu’il reprend la valeur qu’il avait dans le dialogue avant que vous ne l’éditiez).

NOTE : Vous pouvez supprimer les paramètres sous Fixe à tout moment afin d’éliminer les contraintes de coordonnées assignées au point.

4.	Cliquez sur OK.

Les modifications sont enregistrées dans le projet.


Trier des colonnes de liste

 Vue d'ensemble et plus amples informations

Les listes Observations ou Points peuvent être triées dans l’ordre ascendant ou descendant.

A l’origine, la liste Observations est triée avec les résidus affichés en haut de la liste. La liste Points est triée de manière à ce que les points fixes apparaissent en premier. Vous pouvez cliquer sur le libellé de toute colonne pour trier la liste dans l’ordre descendant ou ascendant selon le contenu de la colonne.

Pour trier une colonne :

1.	Placez le curseur sur le libellé de la colonne. Le libellé contient le titre de la colonne et se trouve au-dessus de la première ligne de données.

2.	Cliquez une fois avec le bouton gauche de la souris pour trier la colonne dans l’ordre ascendant.

Vous pouvez répéter ces étapes pour remettre la colonne dans l’ordre descendant. Eventuellement, triez d’autres colonnes dans l’ordre ascendant ou descendant. Le triage des colonnes facilite souvent la recherche de données, particulièrement lorsque la liste contient une grande quantité de données.


Ajuster un réseau

 Vue d'ensemble et plus amples informations

L’ajustement de réseau est un procédé itératif qui débute par un ajustement contraint imperceptiblement et se poursuit par des ajustements successifs. Cette rubrique vous fournit des directives de base pour commencer les ajustements ainsi que des renvois à d’autres rubriques dans lesquelles vous trouverez des instructions plus spécifiques sur les opérations à effectuer pour progressivement amener le réseau à converger.

Avant de commencer le premier ajustement, consultez à nouveau les rubriques suivantes :

1.	Datum d’ajustement

2.	Styles d’ajustement de réseau

3.	Observations

4.	Points

5.	Fixer point(s)

6.	Inclusion et exclusion

7.	Configurer une stratégie de pondération scalaire

8.	Charger et décharger des séparations de géoïde

9.	Créer ou éditer des groupes de variance

10.	Créer ou éditer des groupes de transformation

Ajustements

Suivez les étapes suivantes pour commencer l’ajustement :

1.	Pour commencer l’ajustement, effectuez l’une des opérations suivantes :

  Sélectionnez Ajustement / Ajuster.

  Appuyez sur F10.

Des messages de progression s’affichent sur la barre de statut au fur et à mesure de l’ajustement de réseau et les résultats de l’ajustement s’affichent dans la fenêtre graphique.

2.	Une fois que l’ajustement est terminé, affichez le Rapport d’ajustement de réseau et évaluez les résultats.

Outre les données générées durant l’ajustement, le rapport comprend un message qui indique si l’ajustement a réussi ou pas.


Décharger des séparations de géoïde

 Vue d'ensemble et plus amples informations

Les séparations de géoïde peuvent être déchargées de l’ajustement.

NOTE : Les séparations de géoïde déchargées sont supprimées uniquement de l’ajustement, pas du projet. Le géoïde demeure sélectionné pour le projet et il est toujours utilisé dans le recalcul.

NOTE : Ce fichier d’aide utilise le terme d’observations de géoïde pour décrire les séparations de géoïde utilisées dans les ajustements de réseau.

Pour décharger des séparations de géoïde :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation Géoïde.

3.	Pour décider si les séparations peuvent être déchargées ou non, effectuez l’une des opérations suivantes :

  Si la liste Observations est vide, les séparations de géoïde ne sont pas déchargées dans le projet et vous pouvez arrêter cette procédure ici.

  Si des séparations de géoïde ont été chargées précédemment, les observations sont affichées dans la liste Observations et vous pouvez effectuer cette procédure.

4.	Cliquez sur Décharger. Les séparations de géoïde sont déchargées de l’ajustement et la liste Observations est vidée.

5.	Cliquez sur OK.

Les modifications sont enregistrées.


Utiliser des données de levé GPS

Vue d'ensemble et plus amples informations
Le logiciel Trimble Geomatics Office peut être utilisé avec des données de réseaux de Trimble GPSurvey. Il suffit pour cela d’effectuer une opération d’importation supplémentaire. Vous devez importer des fichiers de solutions de ligne de base (.ssf et .ssk) dans le projet puis ajuster ces lignes de base (observations) à l’aide du logiciel Trimble Geomatics Office. Importez également les points de contrôle connus à l’aide d’un fichier ASCII généré dans GPSurvey.

Pour importer des données GPSurvey :

1.	Créez un nouveau projet dans le logiciel Trimble Geomatics Office. Choisissez les mêmes propriétés de projet que celles sélectionnées pour le projet GPSurvey.

2.	Pour sélectionner la commande Importer, sélectionnez Fichier / Importer.

3.	Sélectionnez la tabulation Données de levé.

4.	Sélectionnez Fichiers SSF/SSK (*.ssf, *.ssk).

5.	Cliquez sur OK.

6.	Naviguez jusqu’au dossier \GPSurvey\Projects\*Nomduprojet*\Trimvec qui contient les fichiers désirés.

7.	Sélectionnez les fichiers désirés.

8.	Cliquez sur Ouvrir. L’importation commence et les lignes de base s’affichent à l’écran.

9.	Utilisez la tabulation Personnalisé du dialogue Importer et les instructions ci-dessus pour importer le fichier ASCII.

Vous êtes maintenant prêt à importer des données GPS supplémentaires et à commencer l’ajustement dans le logiciel Trimble Geomatics Office.


Vérifier des paramètres de transformation

Vue d'ensemble et plus amples informations
Les paramètres de transformation peuvent être vérifiés à tout moment entre les ajustements.

Pour vérifier les paramètres de transformation :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Parcourez la liste jusqu’au groupe désiré.

4.	Sélectionnez le groupe.

5.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

Le champ Nom du groupe indique le nom assigné au groupe. Affichez les observations du groupe à partir de la liste Observations du groupe et les observations disponibles du projet à partir de la liste Observations disponibles. La liste Paramètres de transformation en haut à gauche indique la configuration des paramètres de transformation courants.

6.	Vérifiez les paramètres de transformation dans la liste Paramètres de transformation.

7.	Le cas échéant, éditez les paramètres de transformation.

Les rubriques suivantes vous donnent des directives pour la définition des paramètres de transformation. :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

8.	Pour quitter le dialogue, effectuez l’une des opérations suivantes :

  Si vous avez uniquement vérifié les paramètres de transformation, cliquez sur Annuler. Aucune modification n’est enregistrée.

  Si vous avez édité les paramètres de transformation, cliquez sur OK pour enregistrer les modifications.


Afficher les résultats du test du chi carré

Vue d'ensemble et plus amples informations
Le test du chi carré est une évaluation du facteur de référence du réseau (FR) et des degrés de liberté. Si le FR est proche de 1,0, que les degrés de liberté sont admissibles et que le réseau s’adapte mathématiquement, alors l’ajustement de réseau devrait passer le test du chi carré.

Pour afficher les résultats du test du chi carré :

1.	Sélectionnez Rapports / Rapport d’ajustement de réseau. L’afficheur HTML par défaut démarre et le Rapport d’ajustement de réseau s’affiche avec l’En-tête d’ajustement en haut.

2.	Dans la Table des matières située dans le coin gauche de l’écran, cliquez sur Résumé statistique. Le champ Test du chi carré s’affiche.

3.	Lorsque vous avez terminé la session, quittez votre afficheur.


Afficher l'état fixe des points de contrôle

L’Etat fixe des points de contrôle inclus dans un ajustement de réseau peut être affiché entre les ajustements.

1.	Sélectionnez Ajustement / Points. Le dialogue Points s'affiche.

2.	Utilisez la barre de défilement pour afficher les points de contrôle.

L’Etat fixe des composants de coordonnées d’un point de contrôle a été fixé si une coche s’affiche et supprimé si aucune coche ne s’affiche. Par ailleurs, le composant de coordonnées correspondant s’affiche dans la colonne Fixe ou les parenthèses des identificateurs des points de qualité de contrôle sont supprimées.

3.	Cliquez sur Annuler. Aucune modification n’est enregistrée dans le projet.

NOTE : La qualité des coordonnées peut également être affichée dans la fenêtre Propriétés. Si un point a un statut fixe, il est affiché comme contrôle fixe.


Afficher les degrés de liberté

 Vue d'ensemble et plus amples informations

Utilisez ces statistiques pour afficher le degré de redondance du réseau.

Pour afficher la valeur des degrés de liberté :

1.	Pour afficher le rapport, sélectionnez Rapports / Rapport d’ajustement de réseau. L’afficheur HTML par défaut démarre et le Rapport d’ajustement de réseau s’affiche avec l’En-tête d’ajustement en haut.

2.	Dans la Table des matières située dans le coin gauche de l’écran, cliquez sur Résumé statistique.

Le champ des degrés de liberté se trouve dans cette section du rapport.

Ce champ représente le nombre d’observations indépendantes incluses dans l’ajustement et utilisées pour surdéterminer vos solutions. Plus ce nombre est élevé, mieux c’est, à condition que toutes vos observations soient indépendantes. Pour de plus amples informations, référez-vous à la rubrique Sélectionner des lignes de base indépendantes.

3.	Lorsque vous avez terminé la session, quittez votre afficheur HTML.


Afficher le facteur de référence du réseau

 Vue d'ensemble et plus amples informations

Cette valeur vous indique la qualité de la correspondance des erreurs à posteriori de l’ajustement avec les résidus d’observation, c.-à-d. que le facteur de référence du réseau vous permet de connaître la qualité de correspondance des erreurs aléatoires avec ces observations.

Pour afficher la valeur du facteur de référence du réseau :

1.	Pour afficher le rapport, sélectionnez Rapports / Rapport d’ajustement de réseau.

L’afficheur HTML par défaut démarre et le Rapport d’ajustement de réseau s’affiche avec l’En-tête d’ajustement en haut.

2.	Dans la Table des matières située dans le coin gauche de l’écran, cliquez sur Résumé statistique.

Le champ Facteur de référence du réseau se trouve dans cette section du rapport.

3.	Lorsque vous avez terminé la session, sélectionnez la commande vous permettant de quitter l’afficheur HTML (habituellement Fichier / Quitter).


Afficher le Rapport d'ajustement de réseau

 Vue d'ensemble et plus amples informations

Après avoir effectué un ajustement, afficher le Rapport d’ajustement de réseau.

1.	Pour afficher le rapport, sélectionnez Rapports / Rapport d’ajustement de réseau. Le Rapport d’ajustement de réseau s’affiche dans l’afficheur HTML par défaut de votre ordinateur.

2.	Utilisez les directives suivantes pour afficher les résultats de l’ajustement :

  Cliquez sur les hyperliens à gauche de l’écran pour vous rendre dans une section particulière du rapport.

  Utilisez la commande de l’afficheur HTML pour retourner en haut d’une page. La plupart des afficheurs HTML possèdent un bouton Retour à cette fin.

  Utilisez les touches page précédente et page suivante, les barres de défilement ou toute autre commande de l’afficheur HTML pour parcourir le rapport.

  Passez de l’afficheur HTML au logiciel Trimble Geomatics Office en appuyant sur Alt+Tab. Chaque fois que vous appuyez sur Alt+Tab, vous passez à la fenêtre ouverte suivante.

  Votre afficheur HTML par défaut étant une application séparée, vous pouvez le minimiser pour qu’il apparaisse sur la barre des tâches et retourner au logiciel Trimble Geomatics Office pour effectuer la modification des ajustements sur la base de vos évaluations. Vous pouvez ensuite retourner au rapport en maximisant la fenêtre de l’afficheur HTML par défaut et effectuer des évaluations supplémentaires. Ce procédé peut être répété autant de fois que cela est nécessaire durant la session courante d’évaluation du rapport.

  Il se peut que vous préfériez imprimer le rapport pour effectuer vos évaluations. Utilisez la commande Imprimer (habituellement Fichier / Imprimer) de votre afficheur HTML pour afficher le rapport.

  Les rapports peuvent être écrits dans un fichier à des fins d’archivage ou d’impression ultérieure en affichant le rapport dans un fichier.

  Si vous possédez une version d’Adobe® Acrobat®, vous pouvez afficher des rapports dans un fichier puis « distiller » le fichier. Cela vous permet de disposer d’une documentation de rapport qui peut être affichée avec des hyperliens.

  Les rapports peuvent être envoyés à des tiers à l’aide de la commande de courrier électronique de votre afficheur HTML. Dans le cas d’applications en temps réel, cela peut s’avérer utile pour l’envoi de rapports à des observateurs mobiles sur le terrain. Cela peut également s’avérer utile pour le transfert de données de rapport du terrain aux archives centrales.

3.	Fermez l’afficheur HTML.


Afficher des observations sélectionnées pour l'ajustement

 Vue d'ensemble et plus amples informations

Affichez la liste Observations pour vérifier les observations utilisées dans l’ajustement :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde. La liste Observations sélectionnée s’affiche.

3.	Utilisez la barre de défilement pour parcourir la liste.

4.	Après avoir affiché les observations, cliquez sur Annuler.

Aucune modification n’est enregistrée dans le projet.


Afficher des observations d'un groupe de transformation

 Vue d'ensemble et plus amples informations

Des observations d’un groupe de transformation peuvent être affichées à tout moment entre les ajustements.

Pour afficher les observations d’un groupe de transformation :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Parcourez la liste et sélectionnez le groupe désiré.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

Le champ Nom du groupe indique le nom assigné au groupe. Affichez les observations du groupe à partir de la liste Observations du groupe et les observations disponibles du projet à partir de la liste Observations disponibles.

5.	Après avoir affiché les observations du groupe, cliquez sur Annuler.

Aucune modification n’est enregistrée dans le projet.


Afficher des groupes de transformation

 Vue d'ensemble et plus amples informations

Des groupes de transformation peuvent être affichés à tout moment entre les ajustements.

Pour afficher des groupes de transformation :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Parcourez la liste jusqu’au groupe désiré.

4.	Sélectionnez le groupe.

5.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

Le champ Nom du groupe indique le nom assigné au groupe. Affichez les observations du groupe à partir de la liste Observations du groupe et les observations disponibles du projet à partir de la liste Observations disponibles. La liste Paramètres de transformation en haut à gauche indique la configuration des paramètres de transformation courants.

ASTUCE : Vous pouvez également afficher les paramètres de transformation à partir de la tabulation Ajustement de la tabulation du Système de coordonnées détaillé de la fenêtre Propriétés du projet.

6.	Après avoir affiché le groupe, cliquez sur Annuler.

Aucune modification n’est enregistrée dans le projet.


Afficher des paramètres de transformation

Vue d'ensemble et plus amples informations
Des paramètres de transformation peuvent être affichés entre les ajustements.

ASTUCE : Vous pouvez également afficher des paramètres de transformation à partir de la tabulation Ajustement de la tabulation du Système de coordonnées détaillé de la fenêtre Propriétés du projet.

Pour afficher les paramètres de transformation :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe de transformation désiré dans la liste.

4.	Cliquez sur Editer. Le dialogue Editer groupes de transformation s'affiche.

La liste Paramètres de transformation se trouve dans le coin supérieur gauche des dialogues sous le champ Nom du groupe.

Pour de plus amples informations sur les paramètres individuels, référez-vous aux rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

NOTE : Les paramètres Rotation d’azimut, Echelle du réseau, Echelle de distance et Constante de distance ne sont pas utilisés pour les transformations de géoïde.

Pour de plus amples informations, référez-vous à Paramètres de transformation.


Afficher des observations d'un groupe de variance

 Vue d'ensemble et plus amples informations

Suivez les étapes suivantes pour afficher un Groupe de variance d’observations de géoïde ou GPS.

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez un Groupe de variance.

4.	Cliquez sur Editer. Le dialogue Editer groupes de variance s’affiche avec la liste des observations

5.	Utilisez la barre de défilement pour parcourir la liste d’observations.

6.	Cliquez sur Annuler. Aucune modification n’est enregistrée dans le projet.


Inclure une ligne de base dans un ajustement de réseau

Vue d'ensemble et plus amples informations
Si, pour quelle raison que ce soit, une ligne de base a été supprimée d’un ajustement de réseau, ses propriétés peuvent être modifiées afin qu’elle soit incluse dans les ajustements de réseau ultérieurs.

NOTE : Afin qu’elle puisse être utilisée dans un ajustement de réseau, la ligne de base doit également être activée.

Pour inclure une ligne de base dans des ajustements de réseau ultérieurs :

1.	Cliquez deux fois sur la ligne de base. La fenêtre Propriétés s’affiche.

2.	Dans la fenêtre Propriétés, ouvrez la page Résumé.

3.	Sélectionnez la case à cocher Utiliser dans ajustement de réseau pour inclure la ligne de base aux ajustements ultérieurs.

4.	Après avoir effectué vos modifications, cliquez sur OK.


Supprimer une observation d'un ajustement de réseau

 Vue d'ensemble et plus amples informations

Vous pouvez supprimer une observation d’ajustements de réseau ultérieurs en modifiant ses propriétés.

Pour cela :

1.	Cliquez deux fois sur l’observation. La fenêtre Propriétés s’affiche.

2.	Cliquez sur le bouton de menu de la page Résumé [image]. Dans la page Résumé, la case à cocher Utiliser dans ajustement de réseau est sélectionnée si la ligne de base est incluse dans les ajustements de réseau ultérieurs.

3.	Désélectionnez cette case à cocher. L’observation est supprimée des ajustements de réseau ultérieurs.

4.	Après avoir effectué vos modifications, cliquez sur OK.

NOTE : Vous pouvez également supprimer une observation d’un ajustement de réseau dans le dialogue Observations.


Exclure des observations d'un ajustement de réseau

 Vue d'ensemble et plus amples informations

Toutes les observations ajustables sont marquées pour ajustement lorsque des observations sont importées. Cependant, des observations individuelles peuvent être exclues d’un ajustement à l’aide du dialogue Observations. L’exclusion d’une observation ne la supprime pas du projet.

Pour exclure des observations :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Dans la liste Observations, localiser l’observation que vous souhaitez exclure.

ASTUCE : Vous pouvez filtrer des observations dans la liste Observations disponibles afin d’afficher ou de masquer des types d’observations. Le masquage temporaire des types d’observations sélectionnés réduit la longueur de la liste et facilite ainsi la recherche d’observations.

4.	Vérifiez que la case à cocher de la colonne Utiliser de l’observation est désélectionnée.

5.	Après avoir exclu les observations, cliquez sur OK pour enregistrer les modifications dans le projet.

NOTE : Des observations peuvent également être exclues d’un ajustement en désélectionnant l’option Utiliser dans ajustement de réseau de la page Résumé de la fenêtre Propriétés.

Les observations qui ont été exclues d’un ajustement peuvent être incluses à nouveau.

NOTE : Les observations peuvent également être désactivées ou réactivées. Pour de plus amples informations, référez-vous à Désactivation d’observations et Réactivation d’observations désactivées.


Réactiver des observations désactivées pour les ajustements

 Vue d'ensemble et plus amples informations

Les observations désactivées du dialogue Observations ou de la fenêtre graphique peuvent être réactivées. Une fois réactivées, les observations s’affichent dans le dialogue Observations et peuvent être utilisées pour des ajustements de réseau ou recalculs ultérieurs.

NOTE : La réactivation d’une observation et l’inclusion d’une observation sont deux opérations différentes. Les observations exclues peuvent être incluses dans des ajustements de réseau ultérieurs en sélectionnant la case à cocher Utiliser de l’observation dans le dialogue Observations ou en sélectionnant la case à cocher Utiliser dans ajustement de réseau dans la page Résumé de la fenêtre Propriétés. Une observation désactivée ne peut pas être réactivée à partir du dialogue Observations ; elle doit être réactivée en sélectionnant l’observation en question et en affichant la fenêtre Propriétés à partir de la fenêtre graphique. Pour de plus amples informations, référez-vous à Inclusion d’observations dans un ajustement.

Pour activer des observations à partir de la fenêtre graphique :

1.	Cliquez deux fois sur l’observation. Dans la fenêtre graphique, les observations désactivées apparaissent en rouge.

2.	La fenêtre Propriétés s’affiche.

3.	Cliquez sur le bouton de la page Résumé [image] pour ouvrir la page Résumé.

4.	Dans la liste Etat, sélectionnez Activer.

5.	Vérifiez que la case à cocher Utiliser dans ajustement de réseau est sélectionnée.

6.	L’observation est réactivée et sera utilisée pour les ajustements de réseau et recalculs ultérieurs. Dans la fenêtre graphique, l’observation n’est plus en rouge.

NOTE : Pour de plus amples informations sur l’inclusion et l’exclusion d’observation, référez-vous à Inclusions d’observations et Exclusion d’observations.


Combiner différents types d'observations dans un ajustement de réseau

Vous pouvez combiner des observations GPS, terrestres et de géoïde dans un ajustement de réseau afin de produire un groupe de coordonnées ajustées.

Pour combiner des observations, vous devez lier des observations terrestres au réseau GPS. Sinon, lorsque vous effectuez un ajustement, un message d’erreur peut s’afficher. Pour cela, mesurez les angles et distances aux points communs avec le réseau GPS. Utilisez au moins deux points communs (points observés à la fois dans les groupes de données GPS et terrestres ou points de contrôle) qui peuvent lier les deux groupes de données entre eux. Cela empêche un cheminement terrestre de « pendre » d’une observation GPS par un point.

Avant d’effectuer un ajustement de réseau contraint complètement, vérifiez chaque groupe d’observations afin que vous soyez en mesure de localiser toute erreur éventuelle. Vous devez également effectuer des ajustements contraints imperceptiblement séparés des observations terrestres et GPS.

La procédure recommandée pour combiner des observations dans un réseau d’ajustement comprend plusieurs étapes de base. Les sections suivantes résument brièvement ces étapes.

1.  Importez vos données

a.	Si des points de qualité de contrôle sont associés à votre projet, importez d’abord ces points dans votre projet Trimble Geomatics Office. Cela permet de garantir que ces coordonnées de contrôle sont utilisées comme points de début dans un recalcul. Pour de plus amples informations, référez-vous à Recalcul et à L’importance de l’homogénéisation des coordonnées dans l’ajustement de réseau.

b.	Importez tout autre groupe de données dans votre projet. Veillez à ce que les causes à l’origine de l’affichage de tous les indicateurs d’erreur soient recherchées.

NOTE : Lorsque vous importez des données et que l’option Toujours fusionner les points en double n’est pas sélectionnée dans le dialogue Options de points en double, vous devez fusionner les points en double.

2.	Préparez les données GPS

Pour effectuer un ajustement contraint imperceptiblement sur vos observations GPS, effectuez les opérations suivantes :

a.	Sélectionnez vos données GPS dans la fenêtre graphique.

b.	Traitez vos données GPS.

c.	Effectuez des Fermetures de boucle GPS et affichez le Rapport de fermeture de boucle pour assurer que les observations GPS sont adéquates pour un ajustement.

d.	Supprimez tous les indicateurs de valeurs hors tolérance. Ils peuvent avoir été générés par des coordonnées de contrôle incorrectes, de mauvaises hauteurs d’antenne ou un nom erroné de point.

e.	Sélectionnez les lignes de bases GPS indépendantes.

f.	Sélectionnez le datum WGS-84.

g.	Sélectionnez le style d’ajustement. Si nécessaire, modifiez les paramètres du style d’ajustement.

h.	Dans la tabulation GPS du dialogue Observations, sélectionnez les observations à inclure dans l’ajustement.

ASTUCE : Utilisez le bouton Filtrer du dialogue Observations pour filtrer les types d’observations.

i.	Si nécessaire, définissez des Groupes d’observation (groupes de variance et/ou de transformation) pour les données.

j.	Fixez un point de contrôle dans le dialogue Points. Cette opération est optionnelle.

k.	Configurez la stratégie de pondération. (Pour l’ajustement initial, configurez le type d’observations sur Toutes les observations et Type de scalaire sur Défaut.)

l.	Effectuez un ajustement contraint imperceptiblement.

m.	Affichez les détails de l’ajustement dans le Rapport d’ajustement de réseau.

n.	Si nécessaire, configurez le type de scalaire sur Alternatif, effectuez des ajustements supplémentaires et examinez à nouveau le Rapport d’ajustement de réseau. Continuez jusqu’à ce que l’ajustement passe le test du chi carré avec succès et que vous soyez satisfait des résultats de l’ajustement.

NOTE : Si vous sélectionnez Automatique pour l’option de type de scalaire dans le dialogue Stratégies de pondération, les itérations d’ajustement sont effectuées jusqu’à ce que l’ajustement passe le test du chi carré avec succès.

o.	Si vous sélectionnez l’option Scalaire alternatif lorsque vous avez terminé la dernière itération, verrouillez la valeur scalaire du dialogue Stratégies de pondération.

p.	Si vous avez l’intention d’effectuer une Calibration du site GPS, enregistrez les coordonnées de calibration. Les coordonnées WGS-84 sont enregistrées.

Vos observations GPS sont maintenant prêtes pour un ajustement contraint complètement.

3.  Préparez les données terrestres

Pour effectuer un ajustement contraint imperceptiblement sur vos données terrestres, effectuez les opérations suivantes :

a.	Sélectionnez vos observations terrestres dans la fenêtre graphique.

ASTUCE : Vous pouvez utiliser les filtres d’affichage pour afficher uniquement les observations terrestres.

b.	Sélectionnez le datum du projet.

c.	Dans la tabulation Terrestre du dialogue Observations, sélectionnez les observations à inclure dans l’ajustement.

NOTE : Si vos données terrestres ne consistent pas en un cheminement fermé (c.-à-d. que les observations terrestres « pendent » du réseau d’observations GPS), vous devez également charger les observations de géoïde pour assurer que les observations GPS et terrestres peuvent être liées les unes aux autres à l’aide du géoïde. Si vous incorporez des données de géoïde dans votre ajustement terrestre à ce stade, passez directement à l’étape 5.

d.	Si nécessaire, définissez des Groupes d’observation (groupes de variance et/ou de transformation) pour les données.

e.	Configurez la stratégie de pondération. Pour le premier ajustement, configurez le type d’observations sur Toutes les observations et le type de scalaire sur Défaut.

f.	Fixez un point dans le dialogue Points.

NOTE : Pour effectuer un ajustement combiné, le point que vous fixez doit être l’un des points communs au réseau GPS et au réseau terrestre.

g.	Effectuez un ajustement contraint imperceptiblement.

h.	Affichez les détails de l’ajustement dans le Rapport d’ajustement de réseau.

i.	Si nécessaire, configurez le type de scalaire sur Alternatif, effectuez un autre ajustement et examinez à nouveau le Rapport d’ajustement de réseau. Continuez jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

NOTE : Si vous avez sélectionné Automatique pour l’option de type de scalaire dans le dialogue Stratégies de pondération, les itérations d’ajustement sont effectuées jusqu’à ce que l’ajustement passe le test du chi carré avec succès.

j.	Si vous avez utilisé l’option Scalaire alternatif, verrouillez la valeur scalaire dans le dialogue Stratégies de pondération.

Vos observations terrestres sont maintenant prêtes pour un ajustement contraint complètement.

4.	Incorporez des observations de géoïde dans votre ajustement

Les erreurs de géoïde sont mises à l’échelle dans un ajustement contraint des observations. Pour effectuer un ajustement contraint verticalement de vos données de géoïde, effectuez les opérations suivantes :

a.	Veillez à ce qu’un modèle de géoïde ait été sélectionné pour le projet. Pour cela, vérifiez les détails du système de coordonnées dans le dialogue Propriétés du projet.

b. 	Dans le dialogue Observations, sélectionnez la tabulation Géoïde et chargez les Observations de géoïde.

c.	Configurez la stratégie de pondération. Pour l’ajustement initial, configurez le type de scalaire sur Défaut.

d.	Fixez les élévations (et/ou hauteurs) dans le dialogue Points. Nous recommandons au moins trois contraintes.

e.	Effectuez un ajustement.

f.	Affichez les détails de l’ajustement dans le Rapport d’ajustement de réseau.

g.	Si nécessaire, configurez le type de scalaire sur Alternatif, effectuez un autre ajustement et examinez à nouveau le Rapport d’ajustement de réseau. Continuez jusqu’à ce que l’ajustement passe le test du chi carré avec succès et que vous soyez satisfait des résultats.

h.	Si vous avez utilisé l’option de type de scalaire Alternatif, verrouillez la valeur scalaire dans le dialogue Stratégies de pondération.

5.	Effectuez un ajustement contraint horizontalement

Une fois que vous avez procédé au verrouillage dans la mise à l’échelle des erreurs de l’ajustement contraint imperceptiblement, vous pouvez effectuer un ajustement contraint complètement.

Pour cela :

a.	Vérifiez que le datum du projet est toujours sélectionné.

b.	Fixez des points de contrôle dans le dialogue Points.

NOTE : Afin d’effectuer un ajustement combiné, vous devez fixer au moins deux points GPS.  Dans la mesure du possible, ces points doivent être les points communs au réseau GPS et au réseau terrestre.

c.	Effectuez un ajustement.

d.	Affichez les résultats de l’ajustement dans le Rapport d’ajustement de réseau.

e.	Si nécessaire, effectuez des ajustements supplémentaires jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

ASTUCE : Si l’ajustement ne converge pas, que le test du chi carré échoue ou que le Facteur de référence n’est pas admissible, il se peut qu’il y ait un problème avec vos coordonnées de contrôle. Annulez l’état fixe des points (un à la fois) dans le dialogue Points et effectuez à nouveau un ajustement contraint complètement afin de trouver le mauvais point.  Pour de plus amples informations sur les solutions possibles, référez-vous au Manuel de l’utilisateur pour l’ajustement de réseau.


Effectuer un ajustement de réseau sur des observations GPS

La section suivante est un bref résumé des opérations requises pour ajuster des observations GPS dans le logiciel Trimble Geomatics Office :

1.	Importez des données de contrôle

a.	Si des points de qualité de contrôle sont associés à votre projet, importez d’abord ces points dans votre projet Trimble Geomatics Office. Cela permet de garantir que ces coordonnées de contrôle sont utilisées comme points de début dans un recalcul. Pour de plus amples informations, référez-vous à Recalcul et à L’importance de l’homogénéisation des coordonnées dans l’ajustement de réseau.

b.	Importez et vérifiez tout autre groupe de données importé dans votre projet, et recherchez les causes à l’origine de l’affichage des indicateurs d’erreur.

NOTE : Lorsque vous importez des données et que l’option Toujours fusionner les points en double n’est pas sélectionnée dans le dialogue Options de points en double, vous devez fusionner les points en double.

2.	Préparez les données GPS

a.	Traitez vos données GPS.

b.	Effectuez des Fermetures de boucle GPS et affichez le Rapport de fermeture de boucle pour assurer que les observations GPS sont adéquates pour un ajustement.

c.	Supprimez tous les indicateurs de valeurs hors tolérance. Ils peuvent avoir été générés par des coordonnées de contrôle incorrectes, de mauvaises hauteurs d’antenne ou un nom erroné de point.

d.	Sélectionnez les lignes de bases GPS indépendantes.

e.	Sélectionnez le datum WGS-84.

f.	Sélectionnez le style d’ajustement. Si nécessaire, modifiez les paramètres du style d’ajustement.

g.	Dans la tabulation GPS du dialogue Observations, sélectionnez les observations à inclure dans l’ajustement.

ASTUCE : Utilisez le bouton Filtrer du dialogue Observations pour filtrer les types d’observations.

h.	Si nécessaire, définissez des Groupes d’observation (groupes de variance et/ou de transformation) pour les données.

i.	Fixez un point de contrôle dans le dialogue Points. Cette opération est optionnelle.

j.	Configurez la stratégie de pondération. (Pour l’ajustement initial, configurez le type d’observations sur Toutes les observations et Type de scalaire sur Défaut.)

k.	Effectuez un ajustement contraint imperceptiblement.

l.	Affichez les détails de l’ajustement dans le Rapport d’ajustement de réseau.

m.	Si nécessaire, configurez le type de scalaire sur Alternatif, effectuez des ajustements supplémentaires et examinez à nouveau le Rapport d’ajustement de réseau. Continuez jusqu’à ce que l’ajustement passe le test du chi carré avec succès et que vous soyez satisfait des résultats de l’ajustement.

NOTE : Si vous sélectionnez Automatique pour l’option de type de scalaire dans le dialogue Stratégies de pondération, les itérations d’ajustement sont effectuées jusqu’à ce que l’ajustement passe le test du chi carré avec succès.

n.	Si vous sélectionnez l’option Scalaire alternatif lorsque vous avez terminé la dernière itération, verrouillez la valeur scalaire dans le dialogue Stratégies de pondération.

o.	Si vous avez l’intention d’effectuer une Calibration du site GPS, enregistrez les coordonnées de calibration. Les coordonnées WGS-84 sont enregistrées.

Vos observations GPS sont maintenant prêtes pour un ajustement contraint complètement.

3.	Incorporez des observations de géoïde dans votre ajustement

Les erreurs de géoïde sont mises à l’échelle dans un ajustement contraint des observations. Pour effectuer un ajustement contraint verticalement de vos données de géoïde, effectuez les opérations suivantes :

a.	Veillez à ce qu’un modèle de géoïde ait été sélectionné pour le projet. Pour cela, vérifiez les détails du système de coordonnées dans le dialogue Propriétés du projet.

b.	Dans le dialogue Observations, sélectionnez la tabulation Géoïde et chargez les Observations de géoïde.

c.	Configurez la stratégie de pondération du géoïde. Pour l’ajustement initial, configurez le type de scalaire sur Défaut.

d.	Fixez les élévations (et/ou hauteurs) dans le dialogue Points. Trimble recommande au moins trois contraintes.

e.	Effectuez un ajustement.

f.	Affichez les détails de l’ajustement dans le Rapport d’ajustement de réseau.

g.	Si nécessaire, configurez le type de scalaire sur Alternatif, effectuez un autre ajustement et examinez à nouveau le Rapport d’ajustement de réseau. Continuez jusqu’à ce que vous soyez satisfait des résultats.

h.	Si vous avez utilisé l’option de type de scalaire Alternatif, verrouillez la valeur scalaire dans le dialogue Stratégies de pondération.

4.	Effectuez un ajustement contraint horizontalement

Une fois que vous avez procédé au verrouillage dans la mise à l’échelle des erreurs de l’ajustement contraint imperceptiblement, vous pouvez effectuer un ajustement contraint complètement.

Pour cela :

a.	Vérifiez que le datum du projet est toujours sélectionné.

b.	Fixez des points de contrôle dans le dialogue Points.

c.	Effectuez un ajustement.

d.	Affichez les résultats de l’ajustement dans le Rapport d’ajustement de réseau.

e.	Si nécessaire, effectuez des ajustements supplémentaires jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

ASTUCE : Si l’ajustement ne converge pas, que le test du chi carré échoue ou que le facteur de référence n’est pas admissible, il se peut qu’il y ait un problème avec vos coordonnées de contrôle. Annulez l’état fixe des points (un à la fois) dans le dialogue Points et effectuez à nouveau un ajustement contraint complètement afin de trouver le mauvais point.  Pour de plus amples informations sur les solutions possibles, référez-vous au Manuel de l’utilisateur pour l’ajustement de réseau.


Effectuer un ajustement de réseau sur des observations terrestres

Les sections suivantes constituent un bref résumé des opérations requises pour ajuster des observations terrestres dans le logiciel Trimble Geomatics Office :

NOTE : Si vous avez l’intention d’effectuer un ajustement de réseau à l’aide de données transférées du logiciel Trimble Survey Controller, veillez à entrer une pression, une température ainsi qu’une correction de réfraction et de courbure dans le style de levé du Survey Controller lorsque vous effectuez le levé. Une projection doit également être définie dans le projet.

1.  Importez des données de contrôle

a.	Si des points de qualité de contrôle sont associés à votre projet, importez d’abord ces points dans votre projet Trimble Geomatics Office. Cela permet de garantir que ces coordonnées de contrôle sont utilisées comme points de début dans un recalcul. Pour de plus amples informations, référez-vous à Recalcul et à L’importance de l’homogénéisation des coordonnées dans l’ajustement de réseau.

b.	Importez et vérifiez tout autre groupe de données dans votre projet. Veillez à ce que les causes à l’origine de l’affichage de tous les indicateurs d’erreur soient recherchées.

NOTE : Lorsque vous importez des données et que l’option Toujours fusionner les points en double n’est pas sélectionnée dans le dialogue Options de points en double, vous devez fusionner les points en double.

2.	Préparez les données terrestres

Pour effectuer un ajustement contraint imperceptiblement sur vos données terrestres, effectuez les opérations suivantes :

a.	Importez et contrôlez les données terrestres (recherchez les causes à l’origine de l’affichage de tous les indicateurs d’erreur).

b.	Lorsque votre projet comprend des points en double et que l’option Toujours fusionner points en double n’est pas sélectionnée dans le dialogue Options de points en double, vous devez fusionner les points en double.

c.	Sélectionnez le datum du projet.

d.	Dans la tabulation Terrestre du dialogue Observations, sélectionnez l’observation à inclure dans l’ajustement.

e.	Si nécessaire, définissez des Groupes d’observation (groupes de variance et/ou de transformation) pour les données.

f.	Configurez la stratégie de pondération. Pour le premier ajustement, configurez le type d’observations sur Toutes les observations et le type de scalaire sur Défaut.

g.	Effectuez un ajustement contraint imperceptiblement.

h.	Affichez les détails de l’ajustement dans le Rapport d’ajustement de réseau.

i.	Si nécessaire, configurez le type de scalaire sur Alternatif et effectuez des ajustements supplémentaires jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

NOTE : Si vous avez sélectionné Automatique pour l’option de type de scalaire dans le dialogue Stratégies de pondération, les itérations d’ajustement sont effectuées jusqu’à ce que le test du chi carré soit passé avec succès.

j.	Si vous avez utilisé l’option de type de scalaire Alternatif, verrouillez la valeur scalaire dans le dialogue Stratégies de pondération.

Vos observations terrestres sont maintenant prêtes pour un ajustement contraint complètement.

2.	Effectuez un ajustement contraint horizontalement

Une fois que vous avez procédé au verrouillage dans la mise à l’échelle des erreurs de l’ajustement contraint imperceptiblement, vous pouvez effectuer un ajustement contraint complètement. Pour cela :

a.	Vérifiez que le datum du projet est toujours sélectionné.

b.	Fixez des points de contrôle dans le dialogue Points.

c.	Effectuez un ajustement.

d.	Affichez les résultats de l’ajustement dans le Rapport d’ajustement de réseau.

e.	Si nécessaire, effectuez des ajustements supplémentaires jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

ASTUCE : Si l’ajustement ne converge pas, que le test du chi carré échoue ou que le facteur de référence n’est pas admissible, il se peut qu’il y ait un problème avec vos coordonnées de contrôle. Annulez l’état fixe des points (un à la fois) dans le dialogue Points et effectuez à nouveau un ajustement contraint complètement afin de trouver le mauvais point. Pour de plus amples informations sur les solutions possibles, référez-vous au Manuel de l’utilisateur pour l’ajustement de réseau.


Ajuster des observations de niveaux

La section suivante constitue un bref résumé des opérations requises pour ajuster des observations de niveaux dans le logiciel Trimble Geomatics Office :

1.  Importez des observations de niveaux

Effectuez les opérations suivantes :

a.	Sélectionnez Fichier / Importer. Le dialogue Importer s’affiche.

b.	Dans la tabulation Levé, sélectionnez Fichiers de niveaux numériques (*.dat, *.raw). Le dialogue Ouvrir s'affiche.

c.	Sélectionnez le fichier de niveaux numériques à importer. Le dialogue Importation de niveaux numériques s'affiche. Utilisez ce dialogue pour contrôler les observations de niveaux.

d.	Cliquez sur OK.

Le fichier de niveaux numériques est importé.

NOTE : Vous pouvez également importer manuellement des delta élévations dans le projet à l’aide du Format Trimble Data Exchange.

NOTE : Pour afficher les informations sur les niveaux dans le Rapport de niveau, sélectionnez Rapports / Rapports de niveau.

2.  Affichez les observations de niveaux

Lorsque des données de niveaux numériques sont importées, il n’y a habituellement pas de coordonnées horizontales associées aux élévations, si bien que vous ne pouvez pas afficher celles-ci dans l’Affichage du levé (à moins que le projet ne comporte des coordonnées horizontales pour le point et que les points en double aient été fusionnés). Cependant, vous pouvez afficher les observations de nivellement dans la fenêtre Propriétés. Pour cela :

a.	Choisissez Sélectionner / Tout.

b.	Effectuez l'une des opérations suivantes :

  Sélectionnez Editer / Propriétés.

  Appuyez sur Alt + Entrée.

  Sélectionnez l’outil Fenêtre propriétés dans la barre d’outils.

Vous pouvez maintenant afficher les observations de niveaux.

3.  Effectuez un ajustement contraint imperceptiblement

Pour ajuster des observations de niveaux, effectuez les opérations suivantes :

a.	Sélectionnez le datum du projet.

b.	Sélectionnez le style d’ajustement de réseau.

c.	Sélectionnez les observations à inclure dans l’ajustement dans le dialogue Observations.

ASTUCE : Utilisez le filtre du dialogue Observations pour sélectionner uniquement les observations de delta élévations.

d.	Chargez les observations de géoïde dans le dialogue Observations – tabulation Géoïde.

e.	Dans la tabulation Terrestre du dialogue Observations, définissez les Groupes d’observation (groupes de variance et/ou de transformation) pour les données.

f.	Configurez la stratégie de pondération terrestre. Pour cela, sélectionnez la tabulation Terrestre dans le dialogue Stratégies de pondération. Puis sélectionnez les options appropriées dans les groupes Appliquer scalaires à et Type de scalaire.

g.	Fixez un point dans le dialogue Points.

NOTE : Ce point est généralement le point de station pour lequel vous avez défini une élévation dans le dialogue Importation de niveaux numériques.

h.	Effectuez un ajustement contraint imperceptiblement.

i.	Affichez les résultats de l’ajustement dans le Rapport d’ajustement de réseau.

j.	Si nécessaire, effectuez des ajustements supplémentaires jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

k.	Si vous avez utilisé l’option de type de scalaire Alternatif, verrouillez la valeur scalaire dans le dialogue Stratégies de pondération.

4. Effectuez un ajustement contraint complètement

a.	Vérifiez que le datum du projet est toujours sélectionné.

b.	Fixez des points de contrôle dans le dialogue Points.

c.	Effectuez un ajustement contraint complètement.

d.	Affichez les résultats de l’ajustement dans le Rapport d’ajustement de réseau.

e.	Si nécessaire, effectuez des ajustements supplémentaires jusqu’à ce que vous soyez satisfait des résultats de l’ajustement.

Lorsque l’ajustement est terminé, un groupe de coordonnées ajustées est enregistré pour chaque point dans l’ajustement. Vous pouvez afficher ces coordonnées dans la fenêtre Propriétés.


Utiliser le type de scalaire automatique

Dans le dialogue Stratégies de pondération, vous pouvez choisir l’un des types de scalaire suivants :

  Défaut

  Alternatif

  Défini par l’utilisateur

  Automatique

Lorsque vous démarrez un ajustement, le logiciel configure la stratégie de pondération pour qu’elle applique de type le scalaire par défaut à toutes les observations. Dans l’ajustement, le scalaire par défaut multiplie l’erreur à priori par 1,00, sans modifier les estimations d’erreurs.

Si l’erreur estimée pour vos observations correspond à l’erreur effective, le facteur de référence reporté doit approximativement être 1,00. Sinon, vous devez mettre à l’échelle l’erreur estimée par rapport à l’erreur effective. La méthode la plus simple pour appliquer le scalaire consiste à sélectionner le type de scalaire alternatif. Le type de scalaire alternatif utilise le facteur de référence de l’ajustement courant, multiplié par le scalaire précédent, pour déterminer le scalaire de l’ajustement suivant. Cela permet d’obtenir un facteur de référence plus proche de 1,00. Le scalaire alternatif est appliqué aux itérations d’ajustement supplémentaires jusqu’à ce que le test du chi carré soit passé avec succès.

Si vous sélectionnez l’option de scalaire Automatique, le procédé de sélection du type de scalaire alternatif est automatique ; c.-à-d. que les ajustements sont effectués jusqu’à ce que le test du chi carré soit passé avec succès. Lorsque cela se produit, la valeur scalaire est verrouillée.

NOTE : Lorsque vous sélectionnez le type de scalaire automatique, le Rapport d’ajustement de réseau indique que le type de scalaire alternatif a été sélectionné.

L’importance de la détection des bévues

Les bévues présentes dans un groupe de données entraînent une mise à l’échelle exagérée des autres observations (du même groupe) lors de l’ajustement ; alors avant d’utiliser le type de scalaire automatique, vérifiez que toutes les bévues ont été supprimées. Vous pouvez chercher les bévues ou les données erronées en effectuant l’ajustement à l’aide de l’option de scalaire par défaut puis revoir les résultats.

NOTE : Les indicateurs d’erreur indiquent également les erreurs éventuelles du groupe de données.

Après avoir utilisé l’option de type de scalaire Automatique, réexaminez les résultats de l’ajustement avec soin, en particulier les histogrammes d’ajustement, pour vérifier qu’aucune bévue ne s’est glissée pas dans les observations.

ATTENTION : Trimble vous déconseille d’utiliser l’option de type de scalaire Automatique pour mettre simultanément à l’échelle des observations GPS et terrestres.


    Dialogue Points - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour afficher, évaluer, et contraindre les points d’un ajustement. Les coordonnées affichées dans le dialogue Points sont les coordonnées courantes du point comme indiqué dans la page résumé de la fenêtre Propriétés. Après un ajustement, le dialogue Points indique les valeurs des coordonnées ajustées.

NOTE : Si un point est contraint (fixe) dans le dialogue Points et qu’aucune coordonnée de qualité contrôle n’existe, une coordonnée est enregistrée pour le point.

Pour afficher le dialogue Points :

  Sélectionnez Ajustement / Points.

Les options suivantes sont disponibles :

Datum d'ajustement

Le datum d’ajustement est indiqué au-dessus de la liste de points.

Points

Utilisez cette liste pour afficher les points connectés à des observations dans l’ajustement de réseau. Cette liste ne reflète pas la liste complète des points inclus dans le projet. Pour de plus amples informations sur les champs de la liste, référez-vous à Points.

Fixer

Utilisez les cases à cocher pour contraindre les composants de coordonnées des points individuels inclus dans l’ajustement. Pour de plus amples informations, référez-vous à Fixer.

Affichage des coordonnées

L’affichage détermine le type de coordonnées enregistré dans le projet.

Grille − Sélectionnez ce bouton pour afficher des points dans le groupe de coordonnées de projection de mappage de la tabulation Système de coordonnées du dialogue Propriétés du projet. Il s’agit de l’affichage par défaut.

Local − Sélectionnez ce bouton pour afficher des points dans le groupe de coordonnées géographiques du datum du projet du dialogue Propriétés du projet.

WGS − Sélectionnez ce bouton pour afficher des points dans le groupe de coordonnées géographiques WGS-84.


    Points

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Cette liste comprend les points connectés aux observations incluses dans l’ajustement de réseau et ne reflète pas la liste complète des points inclus dans le projet.

Chaque ligne de la liste comprend les données d’un point. Lorsqu’un composant de coordonnées d’un point est édité, la case à cocher Etat fixe est sélectionnée dans le groupe Fixer. Si la case à cocher Etat fixe est désélectionnée, le composant de coordonnées édité reprend les valeurs de la coordonnée d’origine.

ASTUCE : Les colonnes de la liste peuvent être déplacées et mises à un autre emplacement, être redimensionnées pour afficher plus ou moins d’informations ainsi qu’être triées par ordre ascendant ou descendant.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Point	Le nom assigné au point dans l’ajustement de réseau.
Nord ou Latitude locale ou Latitude WGS-84	La coordonnée Nord du point sur la projection de mappage sélectionnée pour le projet ou la coordonnée Latitude du point dans le projet (local) ou l’ellipsoïde WGS-84.
Est ou Longitude locale ou Longitude WGS-84	La coordonnée Est du point sur la projection de mappage sélectionnée pour le projet ou la coordonnée Longitude du point dans le projet (local) ou l’ellipsoïde WGS-84.
Hauteur	La hauteur du point au-dessus ou au-dessous du Projet (local) ou de l’ellipsoïde WGS-84. Cette valeur est exprimée dans les unités du projet.
Elév	L’élévation du point au-dessus ou au-dessous du niveau moyen de la mer. L’élévation est indiquée après que les séparations de géoïde ont été chargées et appliquées. Cette valeur est affichée dans les unités du projet.
Fixe	L’état fixe (contraint) de chaque composant de la position d’un point. Tout identificateur de composant de coordonnées ou groupe d’identificateurs avec des parenthèses indique qu’un point comporte une coordonnée de qualité contrôle et qu’il n’est pas fixe. Tout identificateur de composant de coordonnées ou groupe d’identificateurs sans parenthèses indique que le composant de coordonnées est fixe pour le point. Par exemple, si un composant inclut le groupe d’identificateurs (NE, é), cela signifie que le nord, l’est et l’élévation ont une qualité de contrôle.
 Les valeurs d’Etat fixe suivantes peuvent s’afficher dans la colonne Fixe :

Affichage fixe :	Ce qui est fixe :
____	Aucun composant du point n’est contraint
LL ou NE__	La position horizontale est contrainte
__h_	La hauteur est contrainte
___é	L’élévation est contrainte
LL ou NEh__	La position horizontale et la hauteur sont contraintes
LL ou NE_é	La position horizontale et l’élévation sont contraintes
LL ou NEhé	La position horizontale, la hauteur et l’élévation sont contraintes
__hé	La hauteur et l’élévation sont contraintes

Lorsque vous fixez un composant de coordonnées (2D, Hauteur, Elév) du point et que le point ne comporte pas de coordonnée de qualité contrôle, la coordonnée est mise à jour dans la fenêtre Propriétés avec le même type de coordonnées que celui de l’Affichage des coordonnées.

Affichage des coordonnées

Ces boutons affichent les composants de coordonnées horizontaux des points du système de coordonnées sélectionné. Cette affichage contrôle également la manière dont les coordonnées éditées sont enregistrées.

Grille − Sélectionnez ce bouton pour afficher des points dans le groupe de coordonnées de projection de mappage de la tabulation Système de coordonnées du dialogue Propriétés du projet.

Local − Sélectionnez ce bouton pour afficher des points dans le groupe de coordonnées géographiques du datum du projet des propriétés du projet.

WGS − Sélectionnez ce bouton pour afficher des points dans le groupe de coordonnées géographiques WGS-84.


    Fixer

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Ces cases à cocher configurent ou annulent l’état fixe des composants de coordonnées des points.

Une coche s’affiche lorsqu’un composant de coordonnées de point est contraint, et la case à cocher correspondant à cette coche est désélectionnée lorsque aucun composant de coordonnées n’est contraint. Les composants de coordonnées comprennent 2D (horizontale), la Hauteur (Ellipsoïde), et l’Elév (Elévation).

Les options suivantes sont disponibles :

2D

Sélectionnez cette case à cocher pour contraindre le point aux composants de coordonnées Nord et Est ou Latitude et Longitude.

Lorsque cette option est sélectionnée, l’état fixe est affiché dans la colonne Fixe de la liste Points.

Hauteur

Sélectionnez cette case à cocher pour contraindre la hauteur au-dessus ou au-dessous de l’ellipsoïde de projet du point. Lorsque cette option est sélectionnée, l’état fixe est affiché dans la colonne Fixe de la liste Points.

Elév

Sélectionnez cette case à cocher pour contraindre l’élévation du point. Cette option est disponible uniquement après que des séparations de géoïde ont été appliquées aux observations du projet. Cette valeur est affichée dans les unités du projet. Lorsque cette option est sélectionnée, l’état fixe est affiché dans la colonne Fixe de la liste Points.

NOTE : Dans le datum WGS-84, ne fixez pas plus d’une coordonnée de grille.

Pour de plus amples informations sur la contrainte des composants de coordonnées de points, référez-vous à Ajustement de réseau.


    Dialogue Observations - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Le dialogue Observations contient les tabulations GPS, Terrestre et Géoïde. Utilisez ces tabulations pour inclure ou exclure des observations GPS, terrestres, et de géoïde dans un ajustement de réseau et pour afficher les résidus d’observation de l’ajustement.

Pour ouvrir le dialogue Observations :

  Sélectionnez Ajustement / Observations.

Vous pouvez également désactiver des observations dans les tabulations GPS et Terrestre. La désactivation d’une observation permet d’empêcher qu’elle soit utilisée dans les ajustements et les recalculs et qu’elle figure dans la liste Observations.

Une fois que vous avez désactivé une observation, vous ne pouvez pas la réactiver à partir du dialogue Observations. Pour de plus amples informations, référez-vous à Désactivation d’observations et Réactivation d’observations désactivées.

Dans la tabulation Géoïde, vous pouvez également charger et décharger des séparations de géoïde.

Les options suivantes sont disponibles pour chaque tabulation :

Observations

Cette liste contient les observations GPS, terrestres et de géoïde. L’aspect et le contenu de la liste varient en fonction des observations. Pour de plus amples informations sur les colonnes comprises dans chaque liste, référez-vous aux rubriques suivantes :

  Observations (GPS)

  Observations (terrestres)

  Observations (de géoïde)

Filtrer

Cliquez sur Filtrer pour afficher le dialogue Filtre d’observation avec les options permettant de filtrer les observations. Pour de plus amples informations, référez-vous à Filtrer des observations.

Charger (tabulation Géoïde uniquement)

Cliquez sur Charger pour charger les séparations de géoïde du modèle de géoïde. Un modèle de géoïde doit être sélectionné dans la tabulation Système de coordonnées du dialogue Propriétés du projet avant que ce bouton ne devienne disponible.

Le modèle de géoïde et les coordonnées horizontales de chaque Point sont utilisés pour l’interpolation de la séparation de géoïde à cet emplacement. En chargeant des séparations de géoïde, on obtient l’élévation pour chaque point à l’aide de la hauteur d’ellipsoïde observée et de la séparation de géoïde observée. Généralement, les séparations de géoïde sont chargées après la production de coordonnées pour chaque point à l’aide d’un ajustement contraint complètement effectué en utilisant le datum pour lequel le modèle de géoïde est défini.

Pour de plus amples informations, référez-vous à Chargement des séparations de géoïde.

Décharger (tabulation Géoïde uniquement)

Cliquez sur Décharger pour supprimer les séparations de géoïde du projet. Pour réutiliser les séparations de géoïde dans votre projet, rechargez-les à l’aide du bouton Charger. Ce bouton est disponible uniquement lorsque la tabulation Géoïde est sélectionnée.

Ce bouton est désactivé lorsque aucun modèle de géoïde n’est sélectionné dans les propriétés du projet ou lorsque aucune séparation de géoïde n’est chargée dans le projet.

Toutes les observations de la liste Observations sont supprimées lorsque les observations sont supprimées du projet.

Pour de plus amples informations, référez-vous à Déchargement des séparations de géoïde.


    Observations (GPS)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez la liste Observations de cette tabulation pour :

 inclure et exclure des observations GPS

 afficher des résidus d’observation

 désactiver des observations

La liste reflète uniquement les observations utilisées dans l’ajustement de réseau. Vous ne pouvez éditer que la colonne Utiliser, les autres colonnes étant affichées uniquement pour référence.

ASTUCE : Vous pouvez filtrer des observations de cette liste pour afficher toute combinaison d’Observations RTK, cinématique, statique ou continu. Le filtrage vous permet de masquer temporairement certaines observations afin d’en trouver d’autres plus facilement. Pour de plus amples informations, référez-vous à Filtrer des observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Utiliser	Sélectionnez ou désélectionnez les cases à cocher de cette colonne pour inclure une observation dans ou pour exclure une observation de l’ajustement de réseau. Utilisez-la pour identifier l’état courant de chaque observation de la liste.  NOTE : Vous pouvez également cliquer avec le bouton droit de la souris sur une observation pour afficher un menu avec une commande permettant de désactiver l’observation. Les observations désactivées sont supprimées de la liste d’observations et ne peuvent pas être utilisées dans un ajustement jusqu’à ce qu’elles soient réactivées. Les Observations désactivées ne peuvent pas être réactivées à partir du dialogue Observations. Pour de plus amples informations, référez-vous à Réactivation d’observations désactivées.
Obs	Le numéro d’enregistrement assigné aux observations. Un « B » s’affiche au début de l’enregistrement pour indiquer que l’enregistrement concerne le type d’observations GPS.
De point	Le point à partir duquel l’observation est mesurée.
Vers point	Le point vers lequel l’observation est mesurée.
Type	La méthode de levé utilisée pour collecter une observation. Les valeurs possibles sont RTK, Cinématique, Statique et Continu.
Groupe de variance	Le groupe de variance, le cas échéant, associé à l’observation.
Rés. Std. (max)	Le résidu standardisé calculé pour l’observation.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


Observations (terrestres)

Plus amples informations

 Dialogue

Vue d'ensemble

Utilisez la liste Observations de cette tabulation pour :

 inclure ou exclure des observations terrestres

 afficher des résidus d’observation

 désactiver des observations

Vous ne pouvez éditer que la colonne Utiliser, toutes les autres colonnes pouvant être affichées uniquement.

ASTUCE : Vous pouvez filtrer des observations de cette liste pour afficher toute combinaison d’observations d’azimuts, d’angles horizontaux, de distances d’ellipsoïde, de delta élévations ou d’élévations trigonométriques. Le filtrage vous permet de masquer temporairement certaines observations afin d’en trouver d’autres plus facilement.

Dans le filtre d’observation terrestre, laissez toutes les observations sélectionnées à moins que vous ne soyez sûr des types d’observations que vous souhaitez sélectionner. Si vous sélectionnez une option, cela équivaut à sélectionner une observation partielle.

Par exemple, si vous sélectionnez le filtre de distance d’ellipsoïde, alors vous ne pouvez obtenir que les observations contenant une distance d’ellipsoïde. Vous ne pouvez pas voir les observations avec un angle horizontal et une distance d’ellipsoïde à moins que vous ne sélectionniez les options de filtrage d’angles horizontaux et de distances d’ellipsoïde.

  Si vous sélectionnez la case à cocher Azimut et désélectionnez les cases à cocher des autres observations, seules les observations avec des azimuts saisis au clavier sont affichées.

  Si vous sélectionnez la case à cocher Delta élévation et désélectionnez les cases à cocher des autres observations, les données de niveau sont sélectionnées.

  Si vous souhaitez afficher des observations brutes, sélectionnez les options angle horizontal, distance d’ellipsoïde et élévation trigonométrique.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Utiliser	Sélectionnez cette case à cocher pour inclure une observation dans ou exclure une observation de l’ajustement de réseau, et utilisez-la pour identifier l’état courant de chaque observation de la liste.  NOTE : Vous pouvez également cliquer avec le bouton droit de la souris sur une observation pour afficher un menu avec une commande permettant de désactiver l’observation. Les observations désactivées sont supprimées de la liste d’observations et ne peuvent pas être utilisées dans un ajustement jusqu’à ce qu’elles soient réactivées. Les Observations désactivées ne peuvent pas être réactivées à partir du dialogue Observations. Pour de plus amples informations, référez-vous à Réactivation d’observations désactivées.
Obs	Le numéro d’enregistrement assigné aux observations. Le numéro d’enregistrement est précédé de la lettre « T » pour indiquer que l’enregistrement concerne un type d’observations terrestre.
Point VA	Le nom du point de visée arrière.
Point d'instr.	Le nom du point d’instrument.
Point VAv	Le nom du point de visée avant.
Groupe de variance	Tout groupe de variance associé à des observations.
Rés. Std. (max)	Le résidu standardisé calculé pour l’observation.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.

NOTE : Les observations d’azimut et de niveaux sont traitées comme des observations terrestres. Pour ces observations, considérez le Point d’instr. comme le point « de » et le point VAv comme le point « vers ».


    Observations (de géoïde)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez la liste Observations de cette tabulation pour afficher des observations de géoïde. Vous pouvez uniquement éditer la colonne Utiliser. Toutes les autres colonnes peuvent être affichées uniquement.

Des séparations de géoïde sont calculées pour tous les points de l’ajustement à partir du modèle de géoïde courant.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Utiliser	Sélectionnez cette case à cocher pour inclure une observation dans ou pour exclure une observation de l’ajustement de réseau. Affichez-la pour déterminer l’état courant des observations.
Obs	Le numéro d’enregistrement assigné aux observations. Un « G » s’affiche au début de l’enregistrement pour indiquer que l’enregistrement concerne une observation de géoïde.
Point	Le nom du point utilisé pour générer l’observation de géoïde.
Séparation	La différence entre la hauteur (d’ellipsoïde) et l’élévation (de géoïde).
Erreur	L’erreur standard pour les observations de géoïde. Elle est calculée lorsque des observations de géoïde sont chargées. Pour écraser une erreur standard, configurez l’erreur standard minimum dans le dialogue Styles d’ajustement de réseau.
Groupe de variance	Le nom du groupe de variance associé à une observation. Avec les observations de géoïde, seul le groupe de variance du <Géoïde par défaut> est listé dans cette colonne.
Rés. Std.	Le résidu standardisé calculé pour l’observation.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Dialogue Filtre d'observation - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour filtrer les types d’observations figurant dans la liste Observations disponibles.

Pour afficher le dialogue Filtre d’observation :

  Cliquez sur Filtrer à partir de tout dialogue contenant une liste Observations disponibles.

Tous les filtres sont activés par défaut, ce qui permet à tous les types d’observations d’être affichés. Désélectionnez la coche pour désactiver les filtres individuels. Le tableau suivant indique les options disponibles :

Sélectionnez cette case à cocher …	Pour filtrer tous …
RTK	les observations RTK (Cinématique en temps réel)
Cinématique	les observations cinématique
Statique	les observations statique
Continu	les segments d'occupation cinématique continu
Azimut	les observations d'azimut. Cette option sélectionne  des observations saisies au clavier.
Angle horizontal	les observations d'angle horizontal
Distance d'ellipsoïde	les observations de distance d'ellipsoïde
Delta élévation	les observations des élévations delta. Cette option sert à filtrer les observations de niveau.
Elévation trigonométrique	les observations d'élévation trigonométrique. Ces observations sont une représentation d'une observation d'angle vertical et de distance inclinée.
Dans le filtre d’observation terrestre, laissez toutes les observations sélectionnées à moins que vous ne soyez sûr des types d’observations que vous souhaitez sélectionner. Si vous sélectionnez une option, cela équivaut à sélectionner une observation partielle. Par exemple, si vous sélectionnez le filtre de distance d’ellipsoïde, alors vous ne pouvez visualiser que les observations contenant une distance d’ellipsoïde. Vous ne pouvez pas visualiser d’observations avec un angle horizontal et une distance d’ellipsoïde à moins que vous ne sélectionniez ces deux options de filtrage.

  Si vous sélectionnez la case à cocher Azimut et désélectionnez les cases à cocher des autres observations, seules les observations avec des azimuts saisis au clavier sont affichées.

  Si vous sélectionnez la case à cocher Delta élévation et désélectionnez les cases à cocher des autres observations, les données de niveau sont sélectionnées.

  Si vous souhaitez afficher des observations brutes, sélectionnez les cases à cocher Angle horizontal, Distance d’ellipsoïde et Elévation trigonométrique.


    Dialogue Groupes de variance - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Le dialogue Groupes de variance contient les tabulations GPS, Terrestre et Géoïde. Utilisez ces tabulations pour afficher, créer, éditer et supprimer des groupes de variance d’observations GSP et d’observations terrestres, ou pour afficher le groupe de variance par défaut des séparations de géoïde.

Pour accéder au dialogue Groupes de variance :

  Sélectionnez Ajustement / Groupes d’observation / Groupes de variance.

Les options suivantes sont disponibles pour chaque tabulation :

Groupes

Utilisez cette liste pour effectuer des sélections avant l’édition ou la suppression de groupes de variance. Au fur et à mesure qu’ils sont créés, les groupes de variance sont ajoutés à cette liste.

Des groupes de variance d’observations GPS sont affichés lorsque la tabulation GPS est sélectionnée, des observations terrestres sont affichées lorsque la tabulation Terrestre est sélectionnée, et des observations de géoïde sont affichées lorsque la tabulation Géoïde est sélectionnée.

NOTE : Initialement, le groupe <Géoïde par défaut> ne contient aucune observation. Des observations s’affichent si un modèle de géoïde est défini dans les propriétés du projet et si des séparations de géoïde sont chargées dans le projet.

Nouveau

Sélectionnez ce bouton pour créer un nouveau groupe de variance pour le projet.

Après que vous avez sélectionné ce bouton, le dialogue Nouveaux groupes de variance s’affiche avec une option vous permettant d’assigner un nom au groupe de variance. Lorsque vous cliquez sur OK pour créer un nouveau groupe, le dialogue Editer groupes de variance s’affiche avec les options vous permettant d’ajouter des observations GPS ou des observations terrestres au groupe. Ce bouton n’est pas disponible lors de l’affichage du groupe de variance <Géoïde par défaut>.

Editer

Sélectionnez ce bouton pour éditer un groupe de variance existant sélectionné dans la liste Groupes. Le groupe sélectionné est chargé dans le dialogue Editer groupes de variance, des observations individuelles pouvant être ajoutées au groupe ou supprimées du groupe.

Tous les groupes de variance GPS et terrestres peuvent être édités tandis que le groupe de variance de géoïde peut être affiché uniquement.

Supprimer

Sélectionnez ce bouton pour supprimer le groupe de variance sélectionné dans la liste Groupes.

Après que vous avez sélectionné ce bouton, un message s’affiche pour confirmer la suppression du groupe de variance. Vous pouvez sélectionner OK pour continuer ou Annuler pour abandonner l’opération.

NOTE : Vous ne pouvez pas supprimer les groupes <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut>.

NOTE : Si certaines de vos observations ont été effectuées sur des lignes très courtes (< 25 mètres), Trimble vous recommande de créer un groupe de variance séparé pour ces observations afin que celles-ci soient mises à l’échelle séparément par rapport aux autres observations.


    Dialogue Editer groupes de variance - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Le dialogue Editer groupes de variance contient les tabulations GPS, Terrestre et Géoïde. Utilisez ces tabulations pour afficher et éditer des groupes de variance, des observations GPS, des observations terrestres  et des séparations de géoïde. Pour les groupes de variance, l’édition correspond à l’ajout et à la suppression d’observations.

Pour afficher le dialogue Editer groupes de variance :

1.	Pour afficher le dialogue Groupes de variance, sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS, Terrestre ou Géoïde.

3.	Sélectionnez le groupe désiré.

4.	Cliquez sur Editer.

Le dialogue Editer groupes de variance s'affiche. Pour de plus amples informations, référez-vous à Edition de groupes de variance.

Les options suivantes sont disponibles pour chaque tabulation :

Nom du groupe

Affichez ce champ pour trouver le nom assigné au groupe de variance. Ce champ sert uniquement de référence et ne peut pas être édité.

Observations du groupe

Utilisez cette liste pour afficher les observations dans un groupe de variance. Il existe trois formes de cette liste : l’une s’affiche pour les observations GPS, la deuxième pour les observations terrestres et la dernière pour les observations pour lesquelles des séparations de géoïde existent. Pour de plus amples informations sur les colonnes de chaque liste, référez-vous aux rubriques suivantes :

  Observations du groupe (GPS)

  Observations du groupe (terrestres)

  Observations du groupe (de géoïde)

Observations disponibles

Gérez cette liste pour afficher toutes les observations GPS incluses dans l’ajustement de réseau. Les observations de cette liste peuvent être sélectionnées et ajoutées au groupe de variance. Tous les champs servent uniquement de référence et ne peuvent pas être édités.

  Observations disponibles (GPS)

  Observations disponibles (terrestres)

  Observations disponibles (de géoïde)

NOTE : La liste Observations disponibles s’affiche mais n’est pas active lors de l’édition du groupe de variance <Géoïde par défaut>.

Ajouter

Sélectionnez ce bouton pour ajouter des observations aux groupes de variance. Ce bouton est disponible uniquement lorsqu’une observation est sélectionnée dans la liste Observations disponibles. L’observation sélectionnée est ajoutée à la liste Observations du groupe. Pour de plus amples informations, référez-vous à Ajout d’observations.

Supprimer

Sélectionnez ce bouton pour supprimer une observation d’un groupe de variance. Ce bouton est disponible uniquement lorsqu’une observation est sélectionnée dans la liste Observations du groupe. Ce bouton est disponible uniquement lors de l’édition des groupes de variance définis par l’utilisateur, pas des groupes de variance par défaut. Pour de plus amples informations, référez-vous à Suppression d’observations.

Filtrer

Sélectionnez ce bouton pour filtrer des observations de la liste Observations disponibles.

Le dialogue Filtre d’observation s’affiche avec les options vous permettant de filtrer les observations de la liste.

Dans le dialogue Editer groupes de variance pour les observations GPS, vous pouvez afficher ou masquer toute combinaison de types d’Observations RTK, cinématique, statique et continu en sélectionnant les options appropriées dans ce dialogue. Dans le dialogue Editer groupes de variance pour les observations terrestres, vous pouvez afficher ou masquer toute combinaison d’Observations d’azimuts, d’angles horizontaux, de distances d’ellipsoïde, de delta élévations ou trigonométriques.

Pour de plus amples informations, référez-vous à Filtrage d’observations.


    Observations du groupe (Groupe de variance - GPS)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Affichez les observations d’un groupe de variance à l’aide de cette liste. Cette forme de la liste ne s’affiche que pour les groupes de variance d’observations GPS.

Des observations peuvent être ajoutées à cette liste et supprimées de la liste. Tous les champs servent uniquement de référence et ne peuvent pas être édités. Lorsqu’une observation est sélectionnée dans cette liste, le bouton Supprimer est disponible et permet de supprimer des observations de cette liste. Pour de plus amples informations, référez-vous à Ajout d’observations et Suppression d’observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement assigné à l’observation dans le projet.
De pt.	Le point de début de l’observation.
Vers pt.	Le point de fin de l’observation.
Type	La méthode de levé utilisée pour collecter l’observation. Les valeurs possibles sont Statique, Cinématique, RTK et Continu.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Observations disponibles (Groupe de variance - GPS)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez cette liste pour afficher toutes les observations GPS qui ont été incluses dans l’ajustement de réseau. Les observations de cette liste peuvent être sélectionnées et ajoutées au groupe de variance. Tous les champs servent uniquement de référence et ne peuvent pas être édités.

Chaque ligne de la liste correspond aux informations de groupe de variance d’une observation. Utilisez la liste comme source pour l’ajout d’observations au groupe de variance. Lorsqu’une observation est sélectionnée dans la liste, le bouton Ajouter devient disponible et permet d’ajouter des observations à la liste Observations du groupe.

ASTUCE : Vous pouvez utiliser le bouton Filtrer pour afficher ou masquer toute combinaison d’Observations RTK, cinématique, statique ou continu. Le filtrage masque temporairement certaines observations, ce qui permet de visualiser les autres plus facilement. Pour de plus amples informations, référez-vous à Filtrage d’observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement assigné à l’observation dans le projet.
De pt.	Le point de début de l’observation.
Vers pt.	Le point de fin de l’observation.
Type	La méthode de levé GPS utilisée pour collecter l’observation. Les quatre valeurs possibles sont RTK, Cinématique, Statique et Continu.
Groupe de variance	Si une observation est assignée au groupe de variance.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Observations du groupe (Groupe de variance - Géoïde)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Chaque ligne de la liste correspond à un enregistrement d’observation enregistré dans le projet. Vous ne pouvez éditer aucun champ.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement des données d’observation enregistrées dans le projet.
Point	Le nom du point à partir duquel les coordonnées ont été utilisées pour extraire les observations de géoïde du modèle.
Séparation	La hauteur de l’observation de géoïde dérivée du modèle de géoïde défini dans les propriétés du projet.
Erreur	L’erreur estimée de la séparation de géoïde.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Observations disponibles (Groupe de variance - Géoïde)

Plus amples informations

 Voir aussi

Vue d'ensemble

La liste Observations disponibles est désactivée et n’est pas utilisée.


    Dialogue Nouveaux groupes de variance

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ce dialogue pour créer un nouveau groupe de variance.

NOTE : Ce bouton n’est pas disponible lorsque la tabulation Géoïde est sélectionnée. Puisque la même méthode est utilisée pour interpoler chaque observation de géoïde du même modèle de géoïde, il n’est pas nécessaire de séparer ces observations en groupes multiples.

Pour afficher le dialogue Nouveaux groupes de variance :

1.	Pour afficher le dialogue Groupes de variance, sélectionnez Ajustement / Groupes d’observation / Groupes de variance. Le dialogue Groupes de variance s'affiche.

2.	Sélectionnez la tabulation GPS ou la tabulation Terrestre.

3.	Cliquez sur Nouveau.

Le dialogue Nouveaux groupes de variance s'affiche.

Les options suivantes sont disponibles :

Nom

Entrez le nom du groupe de variance dans ce champ. Les noms de groupes de variance peuvent comporter jusqu’à 24 caractères, mais les noms descriptifs plus courts sont plus faciles à trouver dans la liste Groupes.

Après avoir donné un nom à un groupe de variance, cliquez sur OK. Le dialogue Editer groupes de variance s’affiche avec les options vous permettant d’ajouter ou de supprimer des observations de groupes de variance. Pour de plus amples informations, référez-vous à Création de groupes de variance.


Observations du groupe (Groupe de variance - Terrestre)

Vue d'ensemble

Dans cette liste Groupes, vous pouvez afficher vos observations dans un groupe de variance. Cette forme de la liste ne s’affiche que pour les groupes de variance d’observations terrestres.

ASTUCE : Vous pouvez ajouter des observations à cette liste ou supprimer des observations de cette liste. (Le bouton Supprimer devient disponible lorsqu’une observation est sélectionnée dans la liste). Cependant, vous ne pouvez éditer aucun champ. Pour de plus amples informations, référez-vous à Ajout d’observations et Suppression d’observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement assigné à l’observation dans le projet.
Point VA	Le nom du point de visée arrière de l’observation.
Point d'instr.	Le nom du point d’instrument de l’observation.
Point VAv	Le nom du point de visée avant de l’observation.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.

NOTE : Les observations d’azimut et de niveaux sont traitées comme des observations terrestres. Pour ces observations, considérez le Point d’instr. comme le point « de » et le point VAv comme le point « vers ».

NOTE : Lorsque vous créez un groupe de variance terrestre, un groupe séparé est créé pour chaque type d’observations. Par exemple, si vous créez un groupe de variance terrestre qui contient des observations d’angles verticaux et de distances, un groupe de variance terrestre est créé pour les observations d’angles, un autre groupe de variance terrestre est créé pour les observations de distances. Cela se passe également dans le cas du groupe de variance <Terr. par défaut>.


Observations disponibles (Groupe de variance - Terrestre)

Vue d'ensemble

Dans cette liste Groupes, vous pouvez afficher toutes les observations terrestres qui ont été incluses dans votre ajustement de réseau. Chaque ligne correspond aux informations de groupe de variance d’une observation. Vous pouvez sélectionner des observations de cette liste pour les ajouter au groupe de variance. Cependant, vous ne pouvez éditer aucun champ.

Lorsqu’une observation est sélectionnée dans la liste, le bouton Ajouter devient disponible et permet d’ajouter des observations à la liste Observations du groupe.

ASTUCE : Vous pouvez utiliser le bouton Filtrer pour filtrer des observations et afficher toute combinaison d’azimuts, d’angles horizontaux, de distances d’ellipsoïde, de delta élévations et d’élévations trigonométriques. Le filtrage masque temporairement certaines observations, ce qui permet de visualiser les autres plus facilement. Pour de plus amples informations, référez-vous à Filtrage d’observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement assigné à l’observation dans le projet.
Point VA	Le nom du point de visée arrière de l’observation.
Point d'instr.	Le nom du point d’instrument de l’observation.
Point VAv	Le nom du point de visée avant de l’observation.
Groupe de variance	Si une observation est assignée au groupe de variance.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Dialogue Groupes de transformation - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez le dialogue Groupes de transformation afin de créer, éditer et supprimer des groupes de transformation pour l’ajustement de réseau. Ce dialogue contient les tabulations GPS, Terrestre et Géoïde. Utilisez ces tabulations pour afficher ou sélectionner des groupes de transformation d’observations GPS, d’observations terrestres, d’observations de géoïde.

Pour accéder au dialogue Groupes de transformation :

  Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation.

Les options suivantes sont disponibles pour chaque tabulation :

Groupes

Utilisez cette liste pour sélectionner un groupe de transformation d’observations GPS, terrestres ou de géoïde.

Le contenu de la liste Groupes change selon que la tabulation GPS, terrestre ou géoïde est sélectionnée.

Trois groupes de transformation par défaut (le groupe <GPS par défaut>, le groupe <Terr. par défaut> et le groupe <Géoïde par défaut>) sont automatiquement créés. Le groupe <Géoïde par défaut> peut être vide ou contenir toutes les observations pour lesquelles des séparations de géoïde existent.

NOTE : Le groupe <Géoïde par défaut> est vide si aucun modèle de géoïde n’est défini pour le projet ou si aucune séparation de modèle de géoïde n’a été chargée dans le projet. Pour de plus amples informations sur la définition d’un modèle de géoïde pour un projet, référez-vous à Système de coordonnées. Pour de plus amples informations sur le chargement des séparations de géoïde d’un modèle de géoïde pour l’ajustement, référez-vous à Observations.

Une liste de tabulations est fournie pour la sélection des groupes de transformation GPS, terrestres ou de géoïde. La tabulation GPS liste le groupe <GPS par défaut> ainsi que tout autre groupe GPS défini par l’utilisateur et créé pour le projet. La tabulation Terrestre liste le groupe <Terr. par défaut> ainsi que tout autre groupe terrestre défini par l’utilisateur et créé pour le projet. La tabulation Géoïde ne liste que le groupe <Géoïde par défaut> ; il est impossible de créer des nouveaux groupes de géoïde.

Après la sélection d’un groupe dans la liste, l’un des boutons disponibles peut être sélectionné pour éditer ou supprimer le groupe de transformation, le cas échéant.

Nouveau

Cliquez sur ce bouton pour créer un nouveau groupe de transformation. Ce bouton n’est pas disponible pour les groupes de transformation de géoïde.

NOTE : Les groupes de transformation <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut> ne peuvent jamais être supprimés. Le groupe de transformation <Géoïde par défaut> est le seul groupe de transformation de géoïde. Des groupes de transformation de géoïde multiples ne sont pas nécessaires parce que les observations de géoïde proviennent d’une source unique, à savoir le modèle de géoïde. Pour le groupe <Géoïde par défaut>, seuls les paramètres de transformation peuvent être édités.

Pour de plus amples informations, référez-vous à Création de groupes de transformation.

Editer

Utilisez ce bouton pour afficher ou éditer des groupes de transformation GPS, terrestres ou de géoïde. Ce bouton est toujours disponible lorsque la liste des groupes GPS, terrestres ou de géoïde est affichée.

Après la sélection de ce bouton, le dialogue Editer groupes de transformation s’affiche avec les options vous permettant d’ajouter ou de supprimer des observations de groupes (GPS et terrestres uniquement) et d’éditer les paramètres de transformation.

Pour de plus amples informations, référez-vous à Edition de groupes de transformation.

Supprimer

Utilisez ce bouton pour supprimer les groupes de transformation GPS ou terrestres sélectionnés. Les groupes de transformation <GPS par défaut>, <Terr. par défaut> et <Géoïde par défaut> ne peuvent jamais être supprimés du projet. Seuls les groupes de transformation GPS ou terrestres définis par l’utilisateur peuvent être supprimés.

NOTE : Le groupe <Géoïde par défaut> ne pouvant pas être supprimé et aucun nouveau groupe de transformation de géoïde ne pouvant être créé, ce bouton n’est jamais disponible lorsque des groupes de transformation de géoïde sont sélectionnés.

Pour de plus amples informations, référez-vous à Suppression de groupes de transformation.


    Dialogue Nouveau groupe de transformation

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez le dialogue Nouveau groupe de transformation pour créer un nouveau groupe de transformation GPS ou terrestre.

NOTE : Ce bouton n’est pas disponible lorsque la tabulation Géoïde est sélectionnée. Puisque la même méthode est utilisée pour interpoler chaque observation de géoïde du même modèle de géoïde, il n’est pas nécessaire de séparer ces observations en groupes multiples.

Pour y accéder :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Sélectionnez la tabulation GPS ou Terrestre.

3.	Cliquez sur Nouveau.

Le dialogue Nouveau groupe de transformation s'affiche.

Une seule option est disponible :

Nom

Entrez le nom du groupe de transformation dans ce champ. Les noms de groupes de transformation peuvent comporter jusqu’à 24 caractères, mais les noms descriptifs plus courts sont plus faciles à trouver dans la liste Groupes.

Après avoir donné un nom à un groupe de transformation, cliquez sur OK. Le dialogue Editer groupes de transformation s’affiche avec les options vous permettant d’ajouter ou de supprimer des observations de groupes de transformation et de définir des paramètres de transformation. Pour de plus amples informations, référez-vous à Création de groupes de transformation.


    Dialogue Editer groupes de transformation - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez le dialogue Editer groupes de transformation pour afficher, éditer et vérifier des groupes de transformation d’observations GPS, terrestres ou de géoïde.

Pour y accéder :

1.	Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation. Le dialogue Groupes de transformation s'affiche.

2.	Dans la tabulation GPS, Terrestre ou Géoïde, sélectionnez le groupe désiré.

3.	Cliquez sur Editer.

Le dialogue Editer groupes de transformation s'affiche. Pour de plus amples informations, référez-vous à Edition de groupes de transformation.

En ce qui concerne les groupes de transformation GPS et terrestres, l’édition consiste à ajouter ou supprimer du groupe des observations incluses dans l’ajustement de réseau et à définir les paramètres de transformation. Les groupes de transformation de géoïde contenant toutes les observations activées de l’ajustement de réseau pour lesquelles des séparations de modèle de géoïde existent, l’édition est limitée à la définition des paramètres de transformation.

NOTE : Le groupe <Géoïde par défaut> est vide si aucun modèle de géoïde n’est défini pour le projet ou si aucune séparation de géoïde du modèle n’a été chargée dans le projet. Pour de plus amples informations sur la définition d’un modèle de géoïde pour un projet, référez-vous à Système de coordonnées. Pour de plus amples informations sur le chargement des séparations de géoïde d’un modèle de géoïde, référez-vous à Observations.

Toute combinaison de paramètres de transformation peut être définie ou calculée pour appliquer des transformations aux observations d’un groupe de transformation. Des groupes de transformation GPS ou terrestres multiples peuvent être créés et différents ensembles de paramètres de transformation peuvent être appliqués à chacun de ces groupes.

ATTENTION : L’application d’une transformation de manière incorrecte peut avoir des effets négatifs sur votre ajustement. Tous les paramètres de transformation doivent être vérifiés avant de tenter d’effectuer des transformations sur un groupe d’observations.

Les options suivantes sont disponibles :

Nom du groupe

Ce champ indique le nom assigné au groupe de transformation. Ce champ sert uniquement de référence et ne peut pas être édité.

Liste Paramètres de transformation

Utilisez cette liste pour définir, calculer ou exclure des paramètres de transformation.

Les paramètres suivants peuvent être définis ou calculés :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur

Chaque définition de paramètre comprend un champ Valeur et une liste Etat. Pour de plus amples informations, référez-vous aux rubriques suivantes :

  Valeur

  Etat

Par défaut, les paramètres de transformation suivants sont configurés sur Calculé pour les groupes de transformation d’observations GPS :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

Par défaut, seule la rotation d’azimut est configurée sur Calculé pour les observations terrestres. Les autres paramètres peuvent être configurés sur Défini par l’utilisateur ou Calculé, mais utilisez-les uniquement lorsqu’une erreur systématique est présente dans les observations. Par exemple, lorsqu’un ajustement est effectué et que toutes les distances (mesurées par des techniques terrestres) présentent un résidu de +3 ppm, un paramètre de distance d’échelle ne peut pas être calculé parce qu’il s’est manifestement produit une erreur systématique lors de la collecte des données. Cette erreur systématique peut être due au fait que le paramètre ppm de l’appareil électronique de mesure des distances n’a pas été appliqué.

NOTE : Les paramètres de rotation d’azimut, d’échelle du réseau, d’échelle de distance et de constante de distance ne sont pas utilisés pour les transformations de géoïde.

Pour des directives de base sur la définition des paramètres de transformation individuels ou des ensembles de paramètres, référez-vous à Paramètres de transformation. Pour des informations plus détaillées sur les techniques et pratiques de transformation des données d’observation, référez-vous à la Bibliographie.

Observations du groupe

Cette liste comprend les observations GPS, terrestres ou de géoïde incluses dans un groupe de transformation. Différentes versions de cette liste peuvent s’afficher en fonction du type d’observations.

Pour de plus amples informations, référez-vous aux rubriques suivantes :

  Observations du groupe (GPS)

  Observations du groupe (terrestres)

  Observations du groupe (de géoïde)

Observations disponibles

Utilisez cette liste pour afficher toutes les observations de l’ajustement de réseau et comme source pour l’ajout d’observations à un groupe de transformation. Tous les champs sont prévus pour l’affichage uniquement et ne peuvent pas être édités.

Pour de plus amples informations sur les champs de cette liste, référez-vous aux rubriques suivantes :

  Observations disponibles (GPS)

  Observations disponibles (terrestres)

  Observations disponibles (de géoïde)

NOTE : La liste Observations disponibles s’affiche mais n’est pas active lors de l’édition du groupe de transformation <GPS par défaut>, <Terr. par défaut> ou <Géoïde par défaut>. Il est impossible de supprimer une observation des groupes de transformation par défaut GPS, terrestres et de géoïde.

Ajouter

Utilisez ce bouton pour ajouter des observations à la liste Observations du groupe. Ce bouton n’est disponible que lorsqu’une observation est sélectionnée dans la liste Observations disponibles.

Supprimer

Utilisez ce bouton pour supprimer des observations de la liste Observations du groupe.

Filtrer

Utilisez ce bouton pour afficher le dialogue Filtre d'observation avec les options vous permettant de filtrer les types d’observations de la liste Observations disponibles.


  Valeur (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ces champs de la seconde colonne de la liste Paramètres de transformation pour afficher ou modifier la valeur appliquée à chaque paramètre de transformation.

Ce champ spécifie toutes les valeurs des paramètres de transformation et l’option sélectionnée dans la liste Etat détermine comment cette valeur est générée et si elle est générée.

Des directives concernant la modification de la valeur et de l’état de paramètres individuels sont listées dans les rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur


    Etat (Paramètre de transformation)

Plus amples informations

Dialogue	Voir aussi
Vue d'ensemble

Utilisez ces champs de la troisième colonne de la liste Paramètres de transformation pour sélectionner la méthode utilisée pour déterminer une valeur de paramètre de transformation.

Les options suivantes sont disponibles :

Calculé

Utilisez cette option pour permettre au logiciel Trimble Geomatics Office de calculer la Valeur de paramètre de transformation dans le cadre de l’ajustement. La valeur de chaque paramètre de la liste est calculée lorsque suffisamment de contraintes de points fixes (points fixés par rapport aux composants de coordonnées) sont incluses dans l’ajustement. Pour de plus amples informations sur les coordonnées permettant d’établir des contraintes, référez-vous à Points.

Défini par l'utilisateur

Utilisez cette option pour entrer une valeur de paramètre de transformation définie par l’utilisateur. Si une valeur de paramètre est connue, cette option est sélectionnée comme état et la valeur connue est entrée dans le champ valeur correspondant.

ATTENTION : Faites particulièrement attention lorsque vous configurez l’état du paramètre sur cette option et lorsque vous entrez des valeurs de paramètres définies par l’utilisateur. Pour des directives générales sur la définition de la valeur et de l’état de paramètres individuels, référez-vous à Paramètres de transformation.

Inutilisé

Utilisez cette option pour désactiver une valeur de paramètre de transformation. Si une valeur est entrée dans le champ Valeur, cette option désactive la valeur en question. Une valeur de paramètre désactivée n’est pas calculée ni appliquée aux observations du groupe de transformation. Il s’agit de la configuration par défaut de tous les paramètres.

ATTENTION : Faites particulièrement attention lorsque vous sélectionnez l’option Etat pour une valeur de paramètre de transformation. L’application d’une valeur de paramètre de transformation de manière incorrecte peut avoir des effets négatifs sur votre ajustement.

Des directives concernant la sélection de l’option Etat pour les paramètres individuels sont incluses dans les rubriques suivantes :

  Déviation de longitude

  Déviation de latitude

  Rotation d’azimut

  Echelle du réseau

  Echelle de distance

  Constante de distance

  Constante de hauteur


    Déviation de longitude (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez le champ Valeur et la liste Etat pour afficher, vérifier ou entrer l’inclinaison de l’Horizon géodésique local dans la direction est-ouest, exprimée en secondes d’arc.

La déviation de longitude est un angle de rotation utilisé à des fins de transformation de datum et parfois (dans le cas d’observations terrestres) pour calculer une correction de Laplace pour les azimuts astronomiques observés. Si vous souhaitez utiliser cet angle de rotation, il vous faut trois hauteurs (élévation et/ou ellipsoïde) qui soient fixes à des positions horizontales (pas nécessairement fixes) connues du réseau. L’angle affecte les observations angulaires et linéaires, horizontales (à l’exception des delta élévations) et verticales, et correspond à l’un des composants pour la déviation de la verticale.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Déviation de latitude (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez les champs Valeur et Etat pour afficher, vérifier ou définir l’inclinaison de l’Horizon géodésique local dans la direction nord-sud, exprimée en secondes d’arc.

La Déviation de latitude est l’un des angles de rotation d’une transformation de datum, qui est utilisé dans la transformation d’observation d’un datum à un autre. Si vous souhaitez utiliser cet angle de rotation, il vous faut trois hauteurs (élévation et/ou ellipsoïde) qui soient fixes à des positions horizontales (pas nécessairement fixes) connues du réseau. L’angle affecte les observations angulaires et linéaires, horizontales (à l’exception des delta élévations) et verticales, et correspond à l’un des composants pour la déviation de la verticale.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Rotation d'azimut (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez les champs Valeur et Etat pour afficher, vérifier, calculer ou entrer l’angle de rotation du système de coordonnées par rapport à la normale de chaque point (dans ce cas, la normale correspond à une ligne perpendiculaire à l’ellipsoïde du point en question) pour rendre compte de la rotation du datum d’ajustement au datum d’observation, exprimée en secondes d’arc. La rotation d’azimut est utilisée pour les transformations de datum et affecte uniquement les azimuts saisis au clavier.

Pour les observations GPS, le calcul de la rotation d’azimut requiert deux points horizontaux fixes. Par défaut, les observations terrestres sont soumises à une rotation pour qu’elles s’accordent avec les azimuts GPS.

Par défaut, seule la rotation d’azimut est configurée sur Calculé pour les observations terrestres. Les autres paramètres peuvent être configurés sur Défini par l’utilisateur ou Calculé, mais utilisez-les uniquement lorsqu’une erreur systématique est présente dans les observations. Par exemple, lorsqu’un ajustement est effectué et que toutes les distances (mesurées par des techniques terrestres) présentent un résidu de +3 ppm, un paramètre de distance d’échelle peut être calculé parce qu’il s’est manifestement produit une erreur systématique lors de la collecte des données. Cette erreur systématique peut être due au fait que le paramètre ppm de l’appareil électronique de mesure des distances n’a pas été appliqué.

NOTE : Le paramètre de rotation d’azimut n’est pas utilisé pour les transformations de géoïde.

NOTE : La rotation est appliquée uniquement aux observations de l’ajustement. Par exemple, les observations de prise de vue isolée, qui ne sont pas incluses dans l’ajustement, ne font pas l’objet d’une rotation.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Echelle du réseau (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez les champs Valeur et Etat pour afficher, vérifier ou entrer un multiplicateur d’Echelle du réseau à appliquer à chaque observation linéaire de l’ajustement. L’Echelle du réseau est utilisée pour la transformation d’un groupe d’observations d’un datum à un autre.

Le calcul d’une Echelle du réseau pour les observations GPS requiert deux points horizontaux fixes et un point vertical  fixe.

Le calcul d’une Echelle du réseau pour les observations terrestres requiert deux points horizontaux fixes ou points verticaux fixes.

L’Echelle du réseau est appliquée aux observations GPS linéaires du groupe de transformation.

NOTE : Le paramètre d’Echelle du réseau n’est pas utilisé pour les transformations de géoïde.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Echelle de distance (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez les champs Valeur et Etat pour afficher, vérifier ou entrer le multiplicateur d’Echelle de distance à appliquer à chaque observation de distance du groupe de paramètres.

L’Echelle de distance est utilisée pour les transformations de datum et parfois pour corriger des erreurs systématiques d’observations. Deux points horizontaux fixes sont requis pour la définition de ce paramètre.

NOTE : Le paramètre d’Echelle de distance n’est pas utilisé pour les transformations de géoïde.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Constante de distance (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez les champs Valeur et Etat pour afficher, vérifier ou entrer une valeur de constante de distance, en unités du projet, pour chaque observation de distance du groupe de paramètres GPS. Ce paramètre corrige les erreurs systématiques de distance des observations. Deux points horizontaux fixes sont requis pour la définition de ce paramètre.

NOTE : Le paramètre de Constante de distance n’est pas utilisé pour les transformations de géoïde.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Constante de hauteur (Paramètre de transformation)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez les champs Valeur et Etat pour afficher, entrer, calculer ou définir une valeur constante de hauteur ajoutée à chaque observation verticale du groupe de transformation. La constante de hauteur est utilisée pour corriger les erreurs systématiques d’observations et pour transformer les modèles de géoïde. Cette valeur de paramètre requiert une élévation et une hauteur.

Ce paramètre corrige les erreurs systématiques d’observations verticales et est utilisé pour transformer des modèles de géoïde.

Pour de plus amples informations, référez-vous à Définition des paramètres de transformation.


    Observations du groupe (Groupe de transformation - GPS)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez cette liste pour afficher les groupes de transformation GPS et ajouter ou supprimer des observations du groupe de transformation GPS. Vous ne pouvez éditer aucun champ.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	L’ID assignée à l’observation. Les numéros des observations GPS sont précédés par la lettre « B ».
De pt.	Le point de début de l’observation.
Vers pt.	Le point de fin de l’observation.
Type	La méthode de levé utilisée pour collecter l’observation.

ASTUCE : Vous pouvez déplacer, redimensionner ou trier les colonnes.


    Observations disponibles (Groupe de transformation - GPS)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez cette liste pour afficher toutes les observations activées de l’ajustement de réseau et comme source pour l’ajout d’observations à un groupe de transformation GPS. Tous les champs sont prévus à des fins d’affichage uniquement et ne peuvent pas être édités.

Lorsque des données sont initialement chargées dans le projet, toutes les observations activées sont ajoutées au groupe <GPS par défaut>. Les observations peuvent être déplacées et mises dans les groupes de transformation définis pas l’utilisateur. Cependant, chaque observation peut se trouver dans un seul groupe défini par l’utilisateur à la fois.

Toute observation de cette liste peut être sélectionnée et ajoutée au groupe de transformation courant. Cela vaut également pour toutes les observations assignées à d’autres groupes de transformation définis par l’utilisateur. Lorsqu’une observation faisant partie d’un autre groupe défini par l’utilisateur est ajoutée au groupe courant, elle est supprimée de l’autre groupe.

ASTUCE : Les observations collectées à l’aide d’une ou plusieurs méthodes de levé peuvent être filtrées. Les observations filtrées sont temporairement masquées, ce qui rend la liste plus courte. Une liste plus courte permet de trouver des observations plus facilement. Utilisez le champ Type pour connaître la méthode de levé utilisée pour collecter les observations. Pour de plus amples informations, référez-vous à Filtrage des observations.

NOTE : La liste ne comprend pas toutes les observations du projet, seulement les observations utilisées dans l’ajustement de réseau.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	L’ID assignée à l’observation. La lettre « B » précède les numéros des observations GPS.
De pt.	Le nom du point de début de l’observation.
Vers pt.	Le nom du point de fin de l’observation.
Type	La méthode de levé utilisée pour collecter l’observation. Les quatre valeurs possibles sont RTK, Cinématique, Statique et Continu.
Groupe de transformation	La transformation à laquelle l’observation est assignée.

ASTUCE : Vous pouvez déplacer, redimensionner ou trier les colonnes.


    Observations du groupe - (Groupe de transformation - Géoïde)

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez cette liste pour afficher le groupe de transformation <Géoïde par défaut>. Ces champs servent uniquement à l’affichage et ne peuvent pas être édités.

Toutes les observations de géoïde utilisées dans l’ajustement de réseau sont automatiquement chargées dans cette liste lorsque des séparations de géoïde sont chargées dans l’ajustement de réseau.

Les Observations de géoïde ne peuvent pas être supprimées de la liste. Le seul moyen pour supprimer une observation de la liste consiste à désactiver l’observation, ce qui empêche qu’elle soit utilisée dans le projet.

ASTUCE : Vous pouvez déplacer, redimensionner ou trier les colonnes.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	L’ID assignée à l’observation. La lettre « G » précède les numéros des observations de géoïde.
Point	Le nom du point à partir duquel les coordonnées ont été utilisées pour extraire les observations de géoïde du modèle.
Séparation	La séparation de géoïde entre l’ellipsoïde WGS-84 et le niveau moyen de la mer.
Erreur	L’erreur estimée de l’observation de géoïde.
NOTE : L’erreur estimée initiale pour les séparations de géoïde est l’erreur standard du groupe d’observations. Le logiciel Trimble Geomatics Office calcule la moyenne de toutes les séparations de géoïde de l’ajustement puis détermine l’erreur standard des séparations. Il s’agit seulement d’un point de début et il est possible que vous deviez mettre les observations à l’échelle avant d’obtenir une représentation fidèle de vos erreurs estimées.

NOTE : Vous pouvez modifier l’erreur standard en augmentant l’erreur standard minimum pour les séparations de géoïde du dialogue Styles d’ajustement de réseau.


    Observations disponibles (Groupe de transformation - Géoïde)

Plus amples informations

 Voir aussi

Vue d'ensemble

La liste Observations disponibles est désactivée et n’est pas utilisée.


Observations du groupe (Groupe de transformation - Terrestre)

Vue d'ensemble

Utilisez cette liste pour afficher les groupes de transformation terrestres et ajouter ou supprimer des observations du groupe de transformation terrestre. Vous ne pouvez pas éditer les informations contenues dans cette liste.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	L’ID assignée à l’observation. La lettre « T » précède les numéros des observations terrestres. La lettre « N » précède les observations de niveaux.
Point VA	Le nom du point de visée arrière de l’observation.
Point d'instr.	Le nom du point d’instrument de l’observation.
Point VAv	Le nom du point de visée avant de l’observation.

ASTUCE : Vous pouvez déplacer, redimensionner ou trier les colonnes.

NOTE : Les observations d’azimut et de niveaux sont traitées comme des observations terrestres. Pour ces observations, considérez le Point d’instr. comme le point « de » et le point VAv comme le point « vers ».


Observations disponibles (Groupe de transformation - Terrestre)

Vue d'ensemble

La liste comprend les observations utilisées dans l’ajustement de réseau. Utilisez-la pour afficher toutes les observations activées de l’ajustement de réseau. Vous pouvez également l’utiliser comme source pour l’ajout d’observations dans un groupe de transformation. Vous ne pouvez pas éditer les informations contenues dans cette liste.

Lorsque des données sont initialement chargées dans le projet, toutes les observations activées sont ajoutées au groupe <Terr. par défaut>. Au fur et à mesure que les groupes de transformation définis par l’utilisateur sont créés, les observations sont supprimées du groupe <Terr. par défaut>.

Vous pouvez sélectionner toute observation de la liste Observations disponibles et l’ajouter au groupe de transformation courant. Cela vaut également pour toutes les observations assignées à d’autres groupes de transformation définis par l’utilisateur. (Lorsque vous effectuez cette opération, l’observation est supprimée de l’autre groupe.)

ASTUCE : Les observations collectées à l’aide de différentes méthodes peuvent être filtrées, par exemple les delta élévations. Les observations filtrées sont temporairement masquées, ce qui rend la liste plus courte. Les observations sont ainsi plus faciles à trouver. Pour de plus amples informations, référez-vous à Filtrage des observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro assigné à l’observation. La lettre « T » précède les numéros des observations terrestres. La lettre « N » précède les observations de niveaux.
Point VA	Le nom du point de visée arrière de l’observation.
Point d'instr.	Le nom du point d’instrument de l’observation.
Point VAv	Le nom du point de visée avant de l’observation.
Groupe de transformation	Cette colonne vous permet de connaître l’observation assignée à un groupe de transformation.

ASTUCE : Vous pouvez déplacer, redimensionner ou trier les colonnes.

NOTE : Les observations d’azimut et de niveaux sont traitées comme des observations terrestres. Pour ces observations, considérez le Point d’instr. comme le point « de » et le point VAv comme le point « vers ».


    Dialogue Stratégies de pondération - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Le dialogue Stratégies de pondération vous permet de définir et d’appliquer des stratégies de pondération à des observations GPS, observations terrestres, observations de géoïde et à des Groupes de variance.

Pour y accéder :

  Sélectionnez Ajustement / Stratégies de pondération.

Le dialogue Stratégies de pondération contient les tabulations GPS, Terrestre et Géoïde. Chacune d’entre elles contient une liste Observations dans laquelle vous pouvez visualiser les observations incluses dans un ajustement de réseau. Sélectionnez la tabulation appropriée pour afficher toutes les observations GPS, observations terrestres ou tous les points pour lesquels des séparations de géoïde existent.

Cette tabulation contient les options suivantes :

Appliquer scalaires à

Sélectionnez l’une de ces options pour définir la méthode utilisée pour appliquer les stratégies de pondération à des observations ou des groupes de variance.

Type de scalaire

Sélectionnez l’une de ces options pour appliquer un scalaire aux erreurs estimées à l’aide de la méthode sélectionnée dans Appliquer scalaires à groupe. Pour de plus amples informations, référez-vous à Type de scalaire.

Valeur scalaire

Ce champ est activé uniquement lorsque l’option Défini par l’utilisateur est sélectionnée dans le groupe Type de scalaire. Entrez une valeur dans ce champ pour définir et appliquer la valeur scalaire.

Lorsque vous cliquez sur Verrouiller, le scalaire de l’ajustement courant est inséré dans ce champ.

ATTENTION : Faites extrêmement attention lorsque vous éditez ce champ. Pour des directives concernant l’évaluation des résultats de stratégies de pondération, référez-vous aux statistiques du Rapport de stratégies de pondération.

Observations

Utilisez cette liste afin d’afficher le scalaire pour toutes les observations GPS, observations terrestres ou toutes les observations pour lesquelles des séparations de géoïde existent. L’aspect et le contenu de cette liste changent selon que la tabulation GPS, Terrestre ou Géoïde est sélectionnée. Pour de plus amples informations, référez-vous aux rubriques suivantes :

  Observations (GPS)

  Observations (terrestres)

  Observations (de géoïde)

Groupes

Affichez cette liste pour visualiser les groupes de variance et la valeur scalaire appliquée à toutes les observations du groupe. Cette liste s’affiche automatiquement lorsque la tabulation GPS est sélectionnée et que Appliquer scalaires à est configuré sur Groupes de variance. Pour de plus amples informations, référez-vous à Groupes.

Verrouiller

Cliquez sur ce bouton pour verrouiller la Valeur scalaire courante.

Verrouillez la Valeur scalaire une fois que l’ajustement a passé le test du chi carré avec succès (facteur de référence ~ 1,00) à l’aide du Type de scalaire Alternatif. Une fois que la Valeur scalaire est verrouillée, le Type de scalaire passe automatiquement à Défini par l’utilisateur et le scalaire s’affiche dans le champ Valeur scalaire. Le Type de scalaire Alternatif n’est plus utilisé.

NOTE : Lorsque l’option de type de scalaire Automatique est sélectionnée et qu’un ajustement automatique est effectué, la Valeur scalaire se verrouille et le type de scalaire passe à Défini par l’utilisateur.

Le bouton Verrouiller est désactivé lorsque le Type de scalaire Défaut ou Défini par l’utilisateur est utilisé.

Appliquer

Cliquez sur ce bouton pour appliquer les stratégies de pondération scalaire à l’itération d’ajustement suivante. Le type de scalaire Défini par l’utilisateur doit être sélectionné avant que ce bouton ne soit disponible.

Filtrer

Cliquez sur ce bouton pour afficher le dialogue Filtre d’observation avec les options permettant de filtrer les observations. Le filtrage s’avère utile lors de l’affichage d’un grand nombre d’observations. Tous les filtres sont automatiquement supprimés lorsque vous quittez le dialogue. Pour de plus amples informations, référez-vous à Filtrage des observations.


    GPS (Stratégies de pondération)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez la tabulation GPS afin d’afficher, de définir et d’appliquer des stratégies de pondération pour les observations GPS.

Pour y accéder :

1.	Sélectionnez Ajustement / Stratégies de pondération. Le dialogue Stratégies de pondération s’affiche.

2.	Sélectionnez la tabulation GPS.

Vous devez effectuer une étape supplémentaire afin de pouvoir accéder aux stratégies de pondération pour les groupes de variance.

Pour accéder aux options du groupe de variance :

  Configurez l’option Appliquer scalaires à sur Groupes de variance.

L’aspect du dialogue change et la liste Observations est remplacée par la liste Groupes. Les groupes de variance peuvent être sélectionnés dans cette liste et les stratégies de pondération peuvent être définies et appliquées aux observations incluses dans les groupes de variance.


Terrestre (Stratégies de pondération)

Vue d'ensemble

Utilisez la tabulation Terrestre afin d’afficher, de définir et d’appliquer des stratégies de pondération pour les observations terrestres. Vous pouvez également accéder à des stratégies de pondération pour les groupes de variance.

Pour cela :

1.	Sélectionnez Ajustement / Stratégies de pondération. Le dialogue Stratégies de pondération s’affiche.

2.	Sélectionnez la tabulation Terrestre.

3.	Si vous souhaitez accéder aux stratégies de pondération pour les groupes de variance, sélectionnez l’option Groupes de variance dans le groupe Appliquer scalaires à.

La liste Observations devient la liste Groupes dans laquelle vous pouvez sélectionner les groupes de variance appropriés. Vous pouvez également définir les stratégies de pondération et les appliquer aux observations incluses dans les groupes de variance.


    Géoïde (Stratégies de pondération)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Utilisez la tabulation Géoïde afin d’afficher, de définir et d'appliquer des stratégies de pondération pour les observations de géoïde.

Pour cela :

1.	Sélectionnez Ajustement / Stratégies de pondération. Le dialogue Stratégies de pondération s’affiche.

2.	Sélectionnez la tabulation Géoïde.

Si aucune observation ne s’affiche dans la liste, essayez la tabulation Géoïde du dialogue Observations. Un modèle de géoïde doit être assigné au projet et les séparations de géoïde doivent être chargées dans le projet à partir du modèle.

NOTE : L’erreur estimée initiale pour les séparations de géoïde est l’erreur standard déterminée sur la base de la moyenne d’un groupe d’observations. Le logiciel Trimble Geomatics Office calcule les moyennes de toutes les séparations de géoïde de l’ajustement puis détermine l’erreur standard pour chaque séparation sur la base de la moyenne. Il s’agit seulement d’un point de début pour l’estimation des erreurs dans la séparation de géoïde et il est possible que vous deviez mettre les observations à l’échelle avant d’obtenir une représentation fidèle de vos erreurs estimées.

NOTE : Vous pouvez modifier l’erreur standard en augmentant l’erreur standard minimum pour les séparations de géoïde du dialogue Styles d’ajustement de réseau.


    Appliquer scalaires à

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ces boutons pour sélectionner la méthode utilisée pour appliquer des stratégies de pondération scalaire à des observations ou groupes de variance.

Les options suivantes sont disponibles :

Toutes les observations

Sélectionnez cette option pour appliquer une stratégie de pondération unique à toutes les observations activées de l’ajustement de réseau d’un type spécifique (GPS, terrestre, de géoïde) sur la base des erreurs de l’ensemble du réseau. Il s’agit de l’option par défaut de l’ajustement de réseau.

Utilisez ce paramètre lorsque toutes les mesures du réseau sont effectuées selon les mêmes directives et à l’aide du même équipement. L’application des stratégies de pondération à toutes les observations est une pratique admissible lorsque vous travaillez avec un réseau simple.

Lorsque le Type de scalaire est configuré sur Défaut, un scalaire par défaut de 1,0 est appliqué à toutes les observations.

Lorsque le Type de scalaire est configuré sur Alternatif, le facteur de référence du groupe de l’ajustement le plus récent multiplié par le scalaire du plus récent ajustement est appliqué à toutes les estimations d’erreurs des observations.

Lorsque le Type de scalaire est configuré sur Défini par l’utilisateur, le curseur s’affiche dans le champ Scalaire de la liste Groupes, vous permettant ainsi d’entrer une valeur scalaire. La valeur entrée dans ce champ est appliquée à toutes les estimations d’erreurs de toutes les observations lorsque l’ajustement suivant est effectué.

Lorsque le type de scalaire est configuré sur Automatique, le logiciel effectue un ajustement automatique à l’aide de l’option de type de scalaire Alternatif. Le logiciel répète l’ajustement jusqu’à ce que le test du chi carré soit passé avec succès.

Pour évaluer les résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement.

Chaque observation

Sélectionnez cette option pour appliquer une stratégie de pondération individuelle à chaque vecteur activé inclus dans l’ajustement de réseau, sur la base de l’erreur de chaque vecteur.

NOTE : Cette option est disponible uniquement sous la tabulation GPS.

Utilisez ce paramètre à des fins de diagnostic, telles que la localisation de mauvaises observations dans un réseau. Trimble vous déconseille d’utiliser cette méthode d’application de stratégies de pondération scalaire pour les ajustements de réseau finaux.

Lorsque le Type de scalaire est configuré sur Défaut, un scalaire par défaut de 1,0 est appliqué à chaque observation.

Lorsque le Type de scalaire est configuré sur Alternatif, le facteur de référence du groupe de variance de l’ajustement le plus récent, multiplié par le scalaire du plus récent ajustement, est appliqué à toutes les estimations d’erreurs de chaque observation.

Pour évaluer les résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement.

Groupes de variance

Utilisez cette option pour appliquer des stratégies de pondération à toutes les observations d’un groupe de variance.

NOTE :Cette option est disponible uniquement lorsque la tabulation GPS ou Terrestre est sélectionnée dans le dialogue Stratégies de pondération.

Lorsque cette option est sélectionnée, la liste Observations est remplacée par la liste Groupes qui indique tous les groupes de variance et leurs valeurs scalaires.

Lorsque le Type de scalaire est configuré sur Défaut, un scalaire par défaut de 1,0 est appliqué à toutes les observations du groupe.

Lorsque le Type de scalaire est configuré sur Alternatif, le facteur de référence du groupe de l’ajustement le plus récent multiplié par le scalaire du plus récent ajustement est appliqué à toutes les estimations d’erreurs des observations du groupe.

Lorsque le Type de scalaire est configuré sur Défini par l’utilisateur, le curseur s’affiche dans le champ Scalaire de la liste Groupes, vous permettant ainsi d’entrer une valeur scalaire. La valeur entrée dans ce champ est appliquée à toutes les estimations d’erreurs des observations du groupe lorsque l’ajustement suivant est effectué.

Lorsque le type de scalaire est configuré sur Automatique, le logiciel effectue un ajustement automatique à l’aide de l’option de type de scalaire Alternatif. Le logiciel répète l’ajustement jusqu’à ce que le test du chi carré soit passé avec succès.

Pour évaluer les résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement.

Pour les observations GPS, les options Toutes les observations, Chaque observation et Groupes de variance sont disponibles. Pour les observations terrestres, les options Toutes les observations et Groupes de variance sont disponibles. Pour les observations de géoïde, seule l’option Toutes les observations est disponible.

Des combinaisons possibles de stratégies de pondération sont indiquées ci-dessous :

Type de scalaire	Appliquer scalaires à	Liste scalaire
Défaut	Toutes les observations	Aucune stratégie de pondération utilisée
	Chaque observation	Aucune stratégie de pondération utilisée
	Groupes de variance	Aucune stratégie de pondération utilisée
Alternatif	Toutes les observations	Un seul scalaire est appliqué globalement à chaque type
	Chaque observation	Un scalaire différent est appliqué à chaque observation
	Groupes de variance	Un scalaire différent est appliqué à chaque groupe
Défini par l'utilisateur	Toutes les observations	Un seul scalaire est appliqué globalement
	Groupes de variance	Un scalaire différent est appliqué à chaque groupe
Automatique	Toutes les observations	Un seul scalaire est appliqué globalement
	Groupes de variance	Un scalaire différent est appliqué à chaque groupe


    Type de scalaire

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez ces options pour sélectionner le type de scalaire appliqué aux observations GPS, observations terrestres, observations de géoïde et aux groupes de variance.

Les options suivantes sont disponibles :

Défaut

Utilisez cette option pour appliquer un scalaire par défaut de 1,0 aux erreurs estimées à l’aide de la méthode sélectionnée dans la liste Appliquer scalaire à.

Utilisez ce type pour la première itération de l’ajustement. Cela entraîne l’application de la valeur nominale de l’erreur estimée, vous permettant ainsi d’évaluer les erreurs du réseau. Il s’agit du paramètre par défaut pour la première itération d’ajustement.

NOTE : Lorsqu’une observation est supprimée de l’ajustement, vous devez à nouveau utiliser le type de scalaire par défaut.

NOTE : Lorsque le scalaire par défaut est utilisé pour les observations GPS, les coordonnées des points « de » sont enregistrées et utilisées pour tous les ajustements suivants (jusqu’à ce qu’un autre ajustement scalaire par défaut soit exécuté) pour modéliser les vecteurs sur l’ellipsoïde.

Pour évaluer les résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement de réseau.

Alternatif

Utilisez cette option pour appliquer un scalaire calculé en multipliant le Facteur de référence de l’ajustement le plus récent par le scalaire du plus récent ajustement. La valeur scalaire ainsi obtenue est appliquée aux erreurs estimées à l’aide de la méthode sélectionnée dans l’option Appliquer scalaires à. Cela permet au logiciel Trimble Geomatics Office de calculer automatiquement le scalaire pour l’itération d’ajustement suivante.

Le scalaire alternatif est appliqué aux erreurs estimées pour chaque itération d’ajustement que vous effectuez jusqu’à ce que les Statistiques globales soient acceptables (c.-à-d. que le test du chi carré ait été passé avec succès). Une fois que les résultats sont acceptables, verrouillez la valeur scalaire pour interrompre l’application d’un nouveau scalaire à chaque itération d’ajustement suivante.

Pour évaluer les résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement.

NOTE : Vous devez tenter une mise à l’échelle alternative des erreurs estimées des valeurs hors normes avant de les supprimer de l’ajustement. Cela vous permet de savoir si les erreurs estimées des valeurs hors normes sont acceptables une fois qu’elles ont été mises à l’échelle. Si la mise à l’échelle alternative ne permet pas de résoudre le problème des valeurs hors normes, supprimez ces dernières et restaurez la stratégie de pondération au type de scalaire par défaut.

ATTENTION : Lors de l’utilisation du scalaire alternatif, contrôlez la magnitude du scalaire au fur et à mesure des itérations d’ajustement. Il est déconseillé d’utiliser des scalaires inhabituellement importants pour résoudre le problème des valeurs hors normes.

Défini par l'utilisateur

Utilisez cette option pour appliquer un scalaire défini par l’utilisateur aux erreurs estimées à l’aide de la méthode sélectionnée dans l’option Appliquer scalaires à.

Ce type est désactivé lorsque Chaque observation est sélectionnée pour l’option Appliquer scalaires à.

Ce type est automatiquement configuré lorsque le bouton Verrouiller est utilisé à la fin d’une mise à l’échelle alternative. Le dernier scalaire alternatif appliqué à l’ajustement est placé dans le champ Valeur scalaire et devient un scalaire défini par l’utilisateur.

La définition manuelle des scalaires est une pratique qui requiert une excellente connaissance des ajustements par la méthode des moindres carrés et des mesures de levé. Trimble déconseille l’utilisation de ce type aux utilisateurs du logiciel Trimble Geomatics Office non avertis. Pour de plus amples informations sur les mesures de levé et les ajustements par la méthode des moindres carrés, référez-vous à la Bibliographie.

Automatique

Lorsque le type de scalaire est configuré sur Automatique, le logiciel effectue un ajustement automatique à l’aide de l’option de type de scalaire Alternatif. (Pour arrêter l’ajustement à tout moment, utilisez la touche Echap.)

Le logiciel répète cet ajustement jusqu’à ce que les statistiques globales soient acceptables, c’est à dire jusqu’à ce que le test du chi carré soit passé avec succès. Cependant, si le test du chi carré n’a pas été passé avec succès après 10 itérations, l’ajustement se termine et un message d’avertissement s’affiche ; vous devez revoir les données d’entrée utilisées pour l’ajustement.

Si l’ajustement automatique s’achève avec succès, la valeur scalaire se verrouille et le type de scalaire devient Défini par l’utilisateur. Un ajustement supplémentaire est effectué puis vous pouvez afficher le Rapport d’ajustement de réseau. Le Rapport d’ajustement de réseau indique que le type de scalaire défini par l’utilisateur a été utilisé.

NOTE : Si l’ajustement automatique ne s’achève pas par un succès (c’est à dire s’il échoue au test du chi carré), le Rapport d’ajustement de réseau indique que le type de scalaire alternatif a été utilisé.

NOTE : Les bévues présentes dans un groupe de données entraînent une mise à l’échelle exagérée des autres observations de l’ajustement ; alors avant d’utiliser le type de scalaire Automatique, vérifiez que toutes les bévues ont été supprimées. Vous pouvez chercher les bévues ou les données erronées en effectuant l’ajustement à l’aide de l’option de scalaire par défaut, puis revoir les résultats.

Après avoir utilisé l’option de type de scalaire Automatique, réexaminez les résultats de l’ajustement avec soin, en particulier les histogrammes d’ajustement, pour vérifier qu’aucune bévue ne s’est glissée dans les observations.

ATTENTION : Trimble vous déconseille d’utiliser l’option de type de scalaire Automatique pour mettre simultanément à l’échelle des observations GPS et terrestres.

Pour évaluer les résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement de réseau.

Les stratégies de pondération suivantes sont possibles selon les diverses options utilisées :

Type de scalaire	Appliquer scalaires à	Liste scalaire
Défaut	Toutes les observations	Aucune stratégie de pondération utilisée
	Chaque observation	Aucune stratégie de pondération utilisée
	Groupes de variance	Aucune stratégie de pondération utilisée
Alternatif	Toutes les observations	Un seul scalaire est appliqué globalement
	Chaque observation	Un scalaire différent est appliqué à chaque observation
	Groupes de variance	Un scalaire unique est appliqué à chaque groupe
Défini par l'utilisateur	Toutes les observations	Un seul scalaire est appliqué globalement
	Groupes de variance	Un scalaire unique est appliqué à chaque groupe
Automatique	Toutes les observations	Un seul scalaire est appliqué globalement
	Groupes de variance	Un scalaire différent est appliqué à chaque groupe

Pour des directives concernant l’évaluation des résultats des stratégies de pondération, référez-vous à la section Stratégies de pondération du Rapport d’ajustement.


    Observations (Stratégies de pondération)

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez la liste Observations pour afficher la stratégie de pondération utilisée pour chaque observation incluse dans un ajustement de réseau. Différentes versions de la liste s’affichent selon que la tabulation GPS, Terrestre ou Géoïde est sélectionnée dans le dialogue Stratégies de pondération.

Cependant, sous les tabulations GPS et Terrestre, lorsque Appliquer scalaires à est configuré sur Groupes de variance, la liste Observations devient automatiquement la liste Groupes.

Pour de plus amples informations, référez-vous aux rubriques suivantes :

  Observations − Observations GPS

  Observations − Observations terrestres

  Observations − Observations de géoïde


    Observations (Stratégies de pondération - GPS)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez la liste Observations afin d’afficher toutes les stratégies de pondération pour toutes les observations GPS qui ont été incluses dans un réseau d’ajustement. Vous ne pouvez pas éditer les informations contenues dans la liste.

La liste Observations est disponible uniquement lorsque Appliquer scalaires à est configuré sur Toutes les observations ou Chaque observation. Lorsque Appliquer scalaires à est configuré sur Groupes de variance, la liste Observations devient automatiquement la liste Groupes.

ASTUCE : Vous pouvez utiliser le bouton Filtrer pour filtrer les observations collectées à l’aide de méthodes de levé différentes. Le filtrage masque temporairement certaines observations, ce qui permet de visualiser les autres plus facilement. Utilisez le champ Type pour déterminer la méthode de levé utilisée pour collecter les observations. Pour de plus amples informations, référez-vous à Filtrage des observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement de l’observation dans l’ajustement de réseau. Un « B » s’affiche au début de l’enregistrement pour indiquer que l’enregistrement concerne une observation GPS.
De pt.	Le point de début de l’observation.
Vers pt.	Le point de fin de l’observation.
Scalaire	Le scalaire individuel de l’observation.
Type	Le type d’observations GPS.
Groupe de variance	Le groupe de variance auquel l’observation est assignée. Les observations GPS individuelles ne peuvent être assignées qu’à un seul groupe de variance ; c’est à dire que des groupes multiples définis par l’utilisateur peuvent exister, mais que chaque observation ne peut être assignée qu’à un seul de ces groupes.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Observations (Stratégies de pondération - Géoïde)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Utilisez la liste Observations pour afficher les observations de géoïde chargées dans le projet. Vous ne pouvez pas éditer les informations contenues dans la liste Observations.

La liste Observations est vide si aucun modèle de géoïde n’est sélectionné pour le projet ou si aucune séparation de géoïde n’a été chargée.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement de l’observation dans l’ajustement de réseau. Un « G » s’affiche au début de l’enregistrement pour indiquer que l’enregistrement concerne une observation de géoïde.
Point	Le nom du point utilisé pour générer l’observation de géoïde.
Scalaire suivant	La valeur scalaire suivante appliquée à l’observation.
Séparation	La séparation de géoïde du modèle de géoïde sélectionné.
Erreur	L’erreur estimée de l’observation de géoïde.
Groupe de variance	Indique si une observation est assignée au groupe de variance. Puisqu’un seul groupe de variance de géoïde peut exister, toutes les observations de géoïde sont assignées au groupe <Géoïde par défaut>. NOTE : Le groupe <Géoïde par défaut> sera toujours le seul groupe de variance de géoïde disponible dans tout ajustement de réseau. Puisque la même méthode est utilisée pour interpoler chaque observation de géoïde du même modèle de géoïde, il n’est pas nécessaire de séparer ces observations en groupes multiples.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


    Groupes (Stratégies de pondération)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

La liste Groupe comprend les groupes de variance et la valeur scalaire appliquée à toutes les observations du groupe.

Sous les tabulations GPS et Terrestre du dialogue Stratégies de pondération, la liste Groupes devient disponible lorsque Appliquer scalaires à est configuré sur Groupes de variance. Cette liste n’est pas disponible sous la tabulation Géoïde.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Nom du groupe	Le nom du groupe de variance. Vous ne pouvez pas éditer les informations contenues dans cette colonne.
Scalaire suivant	La valeur scalaire suivante utilisée pour les groupes de variance. Vous pouvez entrer une valeur scalaire dans cette colonne lorsque le type de scalaire Défini par l’utilisateur est sélectionné. Si le type de scalaire est Défaut ou Alternatif, vous ne pouvez pas éditer les informations contenues dans cette colonne.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.


Observations (Stratégies de pondération - Terrestre)

Vue d'ensemble

Cette liste est disponible uniquement lorsque Appliquer scalaires à est configuré sur Toutes les observations. Vous pouvez l’utiliser afin d’afficher toutes les stratégies de pondération scalaire pour toutes les observations terrestres qui ont été incluses dans un réseau d’ajustement. Cependant, vous ne pouvez éditer aucun champ.

ASTUCE : Vous pouvez utiliser le bouton Filtrer pour filtrer les types d’observations différents. Le filtrage masque temporairement certaines observations, ce qui permet de visualiser les autres plus facilement. Pour de plus amples informations, référez-vous à Filtrage des observations.

Les colonnes suivantes sont disponibles :

Colonne	Ce qu’elle indique
Obs	Le numéro d’enregistrement de l’observation dans l’ajustement de réseau. Un « T » s’affiche au début de l’enregistrement pour indiquer que l’enregistrement concerne une observation terrestre.  La lettre « N » est utilisée pour indiquer des observations de niveaux.
Point VA	Le nom du point de visée arrière de l’observation.
Point d'instr.	Le nom du point d’instrument de l’observation.
Point VAv	Le nom du point de visée avant de l’observation.
Scalaire suivant	Le scalaire suivant appliqué aux observations.
Groupe de variance	Le groupe de variance auquel l'observation est assignée. Bien que des groupes multiples définis par l’utilisateur puissent être utilisés, vous ne pouvez assigner chaque observation qu’à un seul groupe de variance.

ASTUCE : Vous pouvez redimensionner, déplacer ou trier des colonnes de la liste.

NOTE : Les observations d’azimut et de niveaux sont traitées comme des observations terrestres. Pour ces observations, considérez le Point d’instr. comme le point « de » et le point VAv comme le point « vers ».


    En-tête d'ajustement

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez l'En-tête d'ajustement en haut du rapport, pour afficher les informations du projet.

L'en-tête contient des informations collectées des propriétés du projet. Une section de contenu, contenant les liens hypertextes utilisés pour afficher les sections du rapport, s'affiche dans la partie gauche de l'écran.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Utilisez les liens hypertextes dans la section Contenu pour parcourir à travers le rapport.

Les champs ou sous-sections suivants sont disponibles:

Projet

Ce champ affiche le nom du projet.

Nom de l'utilisateur1

Ce champ affiche le nom saisi dans les propriétés du projet.

Date et Heure

Ce champ affiche la date et l'heure auxquelles le rapport a été généré.

Système de coordonnées

Ce champ affiche le système de coordonnées sélectionné dans les propriétés du projet.

Zone

Ce champ affiche la zone de système de coordonnées sélectionnée dans les propriétés du projet. Si un site de calibration GPS est sélectionné, le nom du site est affiché dans le champ Zone.

Tous les systèmes de coordonnées publiés auront une zone. Le seul système de coordonnées sans une zone est la projection par défaut qui affiche "défaut" dans le champ Zone. Le défaut est utilisé lorsque vous faites des suppositions des coordonnées d'un site, telles que N = 10000, E = 10000, et élév = 100.

Datum du projet

Ce champ affiche le datum du projet sélectionné dans les propriétés du projet. Il ne représente pas le datum sélectionné pour l'ajustement.

Datum vertical

Vous pouvez ajouter ce champ aux informations d'en-tête du rapport d'ajustement. Pour afficher le datum vertical utilisé dans le projet, ajoutez les détails nécessaire au champ Datum vertical dans le dialogue Propriétés du projet – tabulation Détails du projet.

Modèle de géoïde

Ce champ affiche le modèle de géoïde si un modèle a été assigné dans les propriétés du projet. Ce champ indique ‘Pas sélectionné’ lorsqu'aucun modèle de géoïde n'est assigné au projet.

Unités de coordonnées

Ce champ affiche les unités du système de coordonnées sélectionnées dans les propriétés du projet.

Unités de distance

Ce champ affiche les unités de distance sélectionnées dans les propriétés du projet.

Unités de hauteur

Ce champ affiche les unités de hauteur dans les propriétés du projet.

Contenu

La section Contenu s'affiche dans la partie gauche de l'écran et comprendra certains, ou tous, des liens hypertextes suivants:

  Détails du projet

  Paramètres de style d'ajustement

  Tolérances résiduelles

  Affichage de covariance

  Contrôles d'ajustement

  Erreurs de configuration

  Résumé statistique

  Statistiques d'observation GPS

  Statistiques de modèle de géoïde

  Statistiques d'observation terrestre

  Stratégies de pondération

  Coordonnées ajustées

  Coordonnées de grille

  Coordonnées géodésiques

  Deltas de coordonnées

  Comparaisons de coordonnées de contrôle

  Observations ajustées

  Observations GPS

  Observations du géoïde

  Observations terrestres

  Histogrammes des résidus standardisés

  Ellipses d'erreur de point

  Termes de covariance

Sélectionnez les liens hypertextes ci-dessus pour obtenir plus amples informations concernant les sections du rapport individuelles.


    Coordonnées ajustées

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez ces statistique pour afficher rapidement:

  Le nombre de points

  Le nombre de points contraints aux composants de coordonnées

  Les valeurs des coordonnées des points contraints et ajustés

  Les erreurs standard a posteriori (estimées) de chaque point dans l'ajustement

  Les erreurs estimées finales

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre avec l'En-tête du rapport en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Coordonnées ajustées.

Les sections de Coordonnées ajustées commencent avec un groupe de champs, suivies des tables séparées affichant les:

  Coordonnées de grille ajustées

  Coordonnées géodésiques ajustées

  Deltas de coordonnées ajustées

Ces tables comprennent des données pour chaque point dans l'ajustement de réseau.

Ces statistiques comprennent:

Ajustement effectué dans

Ce champ identifie le datum utilisé pour effectuer l'ajustement de réseau. Il faut utiliser le datum WGS-84 pour un ajustement contraint imperceptiblement ou un ajustement libre des observations GPS. Si le datum WGS-84 est sélectionné, le champ affiche:

Ajustement effectué dans WGS-84

En général, les ajustements contraints complètement sont effectués utilisant le datum du projet. Le WGS-84 dans l'exemple ci-dessus, est remplacé par le nom du datum du projet.

Nombre de points

Ce champ liste le nombre de points compris dans l'ajustement de réseau.

Nombre de points contraints

Ce champ liste le nombre de points avec des composants de coordonnées contraints.

Le nombre de points contraints est séparé dans une description des composants fixes. Par exemple:

  Horizontal seul

  Hauteur seule

  Elévation seule

  Horizontal et hauteur seuls

  Horizontal et élévation seuls

  Horizontal plus Hauteur et Elévation

Les fichiers dessus sont suivis immédiatement par les tables suivantes:

  Coordonnées de grille ajustées

  Coordonnées géodésiques ajustées

  Deltas de coordonnées ajustées

Pour plus amples informations concernant l'évaluation des données rapportées dans chaque table, référez-vous aux rubriques ci-dessus.


    Deltas de coordonnées

Plus amples informations

 Voir aussi

Vue d'ensemble

Cette table liste l'ampleur du décalage des coordonnées(ajustement) des coordonnées des points dans l'ajustement le plus récent.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre avec l'En-tête du rapport en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Coordonnées ajustées − Deltas.

Les statistiques des Deltas de coordonnées ajustées s'affichent.

Ces statistiques listent tous les points dans l'ajustement et la quantité de décalage appliquée à chaque composant pendant le dernier ajustement. Les deltas sont affichés dans des unités linéaires, basées sur les unités des coordonnées du projet sélectionnées pour le projet.

Les informations des deltas de coordonnées sont très utiles après avoir effectué un ajustement contraint complètement et en particulier lors de l'évaluation des anomalies dans l'ampleur des décalages.

Ces colonnes comprennent:

Colonne	Affiche l'ajustement (décalage) pour …
Nom du point	−
ΔNord	le composant de coordonnée Nord
ΔEst	le composant de coordonnée Est
ΔElévation	l'élévation de coordonnée
ΔHauteur	la hauteur ellipsoïdale de coordonnée
ΔSéparation de géoïde	la séparation de géoïde si un modèle de géoïde est défini et les séparations sont chargées dans le projet. Ce champ est vide lorsque les séparations de géoïde ne sont pas disponibles.


    Termes de covariance

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces statistiques affichent la précision des lignes relative (termes de covariance) entre les points dans l'ajustement.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affichent avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Termes de covariance.

Les statistiques de Termes de covariance s'affichent.

Le nombre de termes de covariance affichés varie selon les Propriété générales définies dans le style d'ajustement.

  Toutes les lignes − La suppression de la coche des options Utiliser réduire profil de colonne et Limiter termes de covariance aux lignes observées affichera tous les possibles Azimut, Hauteur d'ellipsoïde delta, Distance et Elévation delta avec les erreurs associées entre tous le points dans le réseau.

  Lignes observées − La sélection des options Utiliser réduire profil de colonne et Limiter termes de covariance aux lignes observées affichera  l'azimut, la hauteur d'ellipsoïde de delta, la distance et l'élévation delta avec les erreurs associées pour toutes les lignes observées seulement.

Pour plus amples information concernant la modification du contenu de ces statistiques, référez-vous à l'Affichage de covariance.

Utilisez ces statistiques de précision pour vous informer de l'erreur relative de toute paire de points dans le réseau.

Les colonnes de table suivantes sont disponibles:

Colonne	Affichant
De point	Le point de début pour les termes de covariance relatifs.
Vers point	Le point de fin pour les termes de covariance relatifs.
Composants	Les composants de la ligne relative entre les points.
Erreur a-posteriori (   )	L'erreur a posteriori des composants d'observation. Le niveau de confiance sélectionné dans le style d'ajustement s'affiche entre parenthèses et est utilisé pour calculer les estimations a posteriori.
Précision horiz (    )	La précision en deux dimensions ou horizontale des valeurs de covariance. La méthode d'expression des précisions (PPM ou Ratio) est affichée entre parenthèses.
Précision 3D (    )	La précision en trois dimensions des valeurs de covariance. La méthode d'expression des précisions (PPM ou Ratio) est affichée entre parenthèses.


    Histogrammes des résidus standardisés

 Voir aussi

Vue d'ensemble

Utilisez les histogrammes pour afficher les informations suivantes:

  La distribution de fréquence des résidus standardisés

  Les hors des normes d'observation

  La courbe de distribution normale

  La valeur Tau critique

Pour accéder à ces histogrammes:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Histogrammes des résidus standardisés.

Les Histogrammes des résidus standardisés s'affichent.

Ces histogrammes comprennent:

  Combiné− un report combiné des résidus standardisés des observations horizontales et verticales

  Horizontal − un report des résidus standardisés des observations horizontales

  Vertical − un report des résidus standardisés des observations verticales

Les histogrammes affichent de façon graphique la distribution de fréquence des résidus standardisés d'observation de l'ajustement le plus récent. Les statistiques des Observations ajustées listent les résidus standardisés de chaque observation.

La ligne verticale centrale est le résidu zéro. Basés sur une distribution normale, les résidus les plus petits se groupent autour de celui-ci et présentent la fréquence la plus élevée de résidus tracés. Les résidus plus grands sont placés plus loin de la ligne zéro avec une fréquence qui diminue.

Si les résidus d'ajustement sont distribués au hasard, le report de distribution de fréquence se rapproche à la courbe de distribution normale. Cette courbe est superposée sur le rapport des résidus.

Les lignes verticales à gauche et à droite de la ligne zéro indiquent le Tau critique. Tout résidu standardisé en dehors de ces lignes est considéré comme un hors des normes. L'échelle à barre représente la valeur sigma. La valeur sigma correspond à la valeur Tau dans les statistiques des Observations ajustées.


    Statistiques d'observation GPS individuelle

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces statistiques affichent l'ID d'observation, le facteur de référence, et le nombre de redondance (degrés de liberté) de chaque observation comprise (utilisée) dans l'ajustement.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche.

2.	Dans le Contenu, cliquez sur Statistiques d'observation GPS.

Les exemples des statistiques sont affichés ci-dessous:

ID d'observation	Facteur de référence	Nombre de redondance
LB1	1.56	2.03
LB2	0.96	1.88
LB3	1.21	1.66
LB4	2.06	1.93

Les champs suivants sont compris:

ID d'observation

Utilisez ce champ pour vous informer du numéro d'enregistrement du projet assigné à l'observation. Le numéro d'enregistrement comprend les lettres LB suivi d'un ou plusieurs numéros.

Facteur de référence

Utilisez ce champ pour vous informer combien le facteur de référence de chaque observation individuelle contribue au facteur de référence pour les Statistiques d'observation GPS.

NOTE: Les facteurs de référence de toutes les observations individuelles sont considérés lors du calcul du facteur de référence pour toutes les observations GPS. Cette dernière valeur, avec le facteur de référence des observations de géoïde, est utilisée pour calculer le facteur de référence du réseau.

Nombre de redondance

Utilisez ce champ pour vous informer combien de redondance chaque observation GPS contribue aux Statistiques d'observation GPS. Ce champ vous informe si l'observation GPS individuelle manque de redondance. Le Nombre de redondance des Statistiques d'observation GPS, avec le Nombre de redondance des Observations de géoïde, est utilisé pour calculer les degrés de liberté du réseau.

Considérez ces lignes directrices:

  Après l'évaluation du facteur de référence du réseau et les degrés de liberté dans la section Statistique générales, évaluer ces statistiques d'observation individuelle. Tous les Facteurs de référence individuel devraient être centrés sur 1,0.

  Lors de l'évaluation de la liste, recherchez la consistance. Notez tout extrême beaucoup supérieur  ou inférieur à 1,0. Supprimez les hors des normes de l'ajustement pour obtenir plus de consistance dans les statistiques de facteur de référence individuel.

  Les Nombres de redondance individuels fournissent une évaluation de la redondance que chaque observation contribue aux Degrés de liberté généraux du réseau.

  Tous les nombres devraient être supérieurs à 0,00 et inférieurs ou égaux à 3,00.

  Plus proche le Nombre de redondance est à 3,00, plus la redondance que l'observation contribue au réseau.

  Un nombre de redondance de 0,00 suggère que l'observation n'est connectée qu'à une extrémité d'une autre observation. Dans les termes topographiques, cette condition est dénommée une prise de vue isolée. Si la prise de vue isolée n'a pas été délibérée, vérifiez pourquoi l'observation ne contribue pas à la redondance totale du réseau.

NOTE: L'état d'une observation associée à une prise de vue isolée peut être configuré sur Activer comme vérification.


    Nombre d'itérations

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez le message affiché dans ce champ pour vous informer du nombre d'itérations effectuées pour converger l'ajustement avec succès.

Pour accéder à ce message:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique.

Le champ Nombre d'itérations s'affiche.

Tous les messages possibles ont affichés ci-dessous:

Ajustement réussi dans # itération(s)

Ajustement réussi dans # itération(s) (limite de convergence finale utilisée)

(# = nombre d'itérations)

Le nombre d'itérations rapportées ne dépasse jamais les Itérations maximum sélectionnées dans le dialogue Editer style d'ajustement .

NOTE: Si un ajustement ne peut pas converger, un rapport n'est pas généré.


    Observations ajustées

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez ces statistiques pour vous informer les informations suivantes concernant les observations GPS et de géoïde ajustées:

  Le Datum utilisé dans l'ajustement

  La valeur de Tau critique utilisée dans l'ajustement

  Les composants d'observation avec leur erreur standard a posteriori  (estimée) associée, le résidu, et les résidus standardisés

  Les composants d'observation marqués comme étant hors des normes

  Les Paramètres de transformation avec leurs estimations d'erreur associées (ajustement complètement contraint )

  Un résumé des observations utilisées dans l'ajustement et une liste de toutes les observations (GPS, terrestres et de géoïde).

Utilisez les tables d'observation des observations GPS, terrestres, et de géoïde pour:

  Vérifier le nombre d'observations utilisées dans l'ajustement.

  Evaluer les erreurs standard a posteriori de chaque composant d'observation.

  Identifier les composants d'observation qui dépassent le Tau critique défini pour le réseau (hors de normes). Les observations suspectes (hors des normes) sont soulignées en rouge.

  Identifiez toute transformation et toute estimation de grande erreur inattendue dans les paramètres.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête du rapport en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Observations ajustées.

Les statistiques des Observations ajustées s'affichent.

La section est divisée dans les parties suivantes:

  GPS

  Terrestre

  Géoïde

NOTE: Vous pouvez sélectionner les observations dans la Vue de levé du Rapport d'ajustement de levé. Pour ce faire, sélectionnez l'ID d'observation du rapport d'Ajustement de réseau. (Pour sélectionner des observations multiples, utilisez la touche Ctrl). Lorsqu'une observation est sélectionnée dans le rapport, la sélection courante dans la Vue de levé est effacée et remplacée par la (les) observation(s) sélectionnée(s) du rapport.


    Ellipses d'erreur de point

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez ces statistiques pour afficher une représentation graphique de l'ampleur et la direction des erreurs de point (horizontales ainsi que verticales). Les ellipses d'erreur de point indiquent graphiquement les erreurs standard a posteriori des coordonnées horizontales et le terme de covariance entre les points.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Ellipses d'erreur de point.

Les statistiques des Ellipses d'erreur de point s'affichent.

Considérez les lignes directrices suivantes:

  Le haut de l'ellipse est orienté au nord.

  Les flèches à droite de l'ellipse représentent les erreurs standard a posteriori standard des hauteurs et des élévations.

  Les échelles à barre qui passent à travers de l'ellipse et la flèche indiquent l'ampleur des erreurs.

  La valeur de la valeur de coche sur l'échelle à barre est affichée dans les unités du projet avec les ellipses d'erreur. A l'aide de la barre d'outils Ellipse dans la fenêtre graphique, vous pouvez éditer la valeur de coche sur l'échelle à barre pour ajuster la résolution de l'échelle à barre. La barre d'outils Ellipse n'a pas un effet sur l'échelle des ellipses d'erreur du rapport d'Ajustement de réseau.

  L'orientation du demi-grand axe (l'axe indiquant la direction de l'erreur la plus grande) s'affiche en bas à droite de l'ellipse. Cet angle est mesuré en sens inverse des aiguilles d'une montre de l'échelle à barre d'est positif.

  Les erreurs standard pour les coordonnées horizontales et verticales sont multipliées par les scalaires sigma à deux variables et univariable respectivement.


    Résumé statistique

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez cette partie du rapport pour obtenir un accès rapide aux sections de résumé statistique.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique.

Le Résumé statistique s'affiche.

Le résumé statistique est un outil important pour l'analyse des résultats d'ajustement. Les sections clé suivantes du rapport sont accessibles du résumé:

  Nombre d'itérations

  Statistiques générales

  Statistiques des types d'observation

  Statistiques des groupes de variance

  Stratégies de pondération

  Statistiques d'observation GPS individuelle

En général, vous passerez directement au résumé statistique (et en particulier aux Statistiques générales) pour analyser vos résultats généraux lors de la réalisation d'un ajustement contraint imperceptiblement. Le test du chi carré, le facteur de référence du réseau et les valeurs des degrés de liberté sont les indicateurs clé pour indiquer avec quel degré de succès le réseau s'adapte ensemble.


    Statistiques de groupes de variance

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez le résumé de Statistiques de groupe de variance pour vous informer du facteur de référence et du nombre de redondance (degrés de liberté) déterminés pour chaque groupe de variance.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique.

Les statistiques de groupe de variance de chaque type d'observation peuvent être affichées.

Les champs suivants sont rapportés pour chaque groupe de variance:

Nom du groupe

Ce champ affiche le nom du groupe de variance

Facteur de référence

Ce champ indique combien chaque groupe de variance contribue au facteur de référence du réseau. Chaque groupe de variance a ses propres erreurs estimées, donc son propre facteur de référence.

Nombre de redondance

Ce champ indique combien de redondance chaque groupe de variance contribue aux degrés de liberté du réseau. Utilisez ce champ pour vous informer si un groupe de variance manque de redondance.


    Stratégies de pondération

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez ces statistiques pour vous informer si la méthode d'échelle, le type scalaire et la valeur scalaire corrects ont été appliqués aux groupes d'observations GPS, d'observations de géoïde ou aux groupes de variance.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Stratégies de pondération.

Les statistiques de Stratégies de pondération s'affichent.

Des résumés séparés, consistant en un Titre, une Chaîne descriptive and un champ Scalaire, sont générés pour chaque groupe d'Observations GPS, observations terrestres, observations de géoïde et groupe de variance. Un exemple d'un résumé des Observations GPS est fourni ci-dessous:

Observations GPS
Groupe scalaire par défaut appliqué à toutes les observations
Scalaire: 1,00

L'exemple ci-dessus signifie que le type de scalaire par défaut était appliqué à toutes les observations GPS utilisant la valeur Scalaire par défaut de 1,0. Les descriptions des champs qui s'affichent dans la section du rapport Stratégies de pondération sont décrites ci-dessous. Il faut noter que plusieurs combinaisons de ces résumés pourraient s'afficher dans le rapport, selon le nombre de groupes d'observation et le type de stratégies de pondération appliqué aux groupes d'observations.

Les liens entre le Titre, la Chaîne et le champ Scalaire sont indiqués ci-dessous:

Titre	·	Observations GPS
Chaîne	·	Groupe de scalaire par défaut appliqué à toutes les observations
Champ Scalaire ·	Scalaire: 1,00

Titre

Dans l'exemple ci-dessus, GPS Observations est le titre d'un groupe de stratégies de pondération appliqué à toutes les observations GPS. Un titre pour chaque type de groupe d'observation utilisé dans l'ajustement s'affichera sous la section Stratégies de pondération.

Appliquer scalaires à/Type de scalaire

Le premier champ du résumé de chaque groupe d'observation est une chaîne, représentant le type de scalaire utilisé ainsi que la méthode utilisée pour appliquer le scalaire à un groupe d'observations. Il suit immédiatement après un titre décrivant le groupe d'observations. Dans l'exemple ci-dessus, le titre est 'Observations GPS' et la chaîne est ' Scalaire par défaut appliqué à toutes les observations'.

Les trois mots ‘Scalaire appliqué à’ toujours apparaissent dans la chaîne. Ces mots sont précédés par le paramètre Type de scalaire  et suivis par le paramètre Appliquer scalaires à . Ces paramètres sont définis dans le dialogue Stratégies de pondération . Les combinaisons de chaînes possibles pour les divers groupes d'observations sont listées ci-dessous:

  Scalaire par défaut appliqué à toutes les observations

  Scalaire alternatif appliqué à chaque observation GPS

  Scalaire défini de l'utilisateur appliqué à toutes les observations

  Scalaire par défaut appliqué à chaque observation

  Scalaire alternatif appliqué à chaque observation

  Scalaire par défaut appliqué aux groupes de variance

  Scalaire alternatif appliqué aux groupes de variance

  Scalaire défini de l'utilisateur appliqué aux groupes de variance

NOTE: L'option du type de scalaire automatique effectue des itérations multiples du scalaire alternatif. Si le type de scalaire automatique est sélectionné, et l'ajustement est terminé avec succès, le scalaire défini de l'utilisateur s'affiche dans les chaînes listées ci-dessus. Si l'ajustement automatique ne réussit pas (le test du chi carré échoue) la scalaire alternatif s'affiche dans les chaînes listées ci-dessus.

Vérifiez les stratégies de pondération correctes dans la chaîne et utilisez le champ Scalaire, ci-dessous, pour déterminer si le Scalaire correct était appliqué à chaque groupe d'observations ou groupes de variance.

Champ Scalaire

Le champ Scalaire identifie la valeur scalaire appliquée à chaque groupe d'observations. Selon le nombre de groupes d'observation dans un ajustement, plusieurs de ces champs pourraient s'afficher dans le rapport. Collectivement, chaque chaîne et valeur scalaire représentent les stratégies de pondération appliquées à leur groupe d'observations respectif.

Evaluez chacun de ces champs pour vous informer si les valeurs scalaires appliquées au groupe d'observations correspondant est raisonnable. Du fait que plusieurs combinaisons de stratégies de pondération pourraient être définies à plusieurs groupes d'observations, cette section du rapport pourrait comprendre plusieurs paires de chaînes et valeurs scalaires. Il faut évaluer chaque groupe de champs comme un ensemble.


    Coordonnées de grille

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces statistiques affichent les coordonnées de grille ajustées de chaque point dans le dernier ajustement. Les coordonnées comprennent les erreurs standard a posteriori (multipliées par le scalaire de sigma univariable ) associées à chaque composant de coordonnée. L'erreur univariable sélectionnée dans le style d'ajustement est affichée en haut de la liste de Coordonnées.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Coordonnées ajustées − Grille.

Les statistiques de Coordonnées de grille s'affichent.

Ces colonnes comprennent:

Colonne	Indiquant
Nom du point	Le nom du point décrit dans les autres colonnes.
Nord	Le composant Nord ajusté du point, dans les unités du système de coordonnées.
Erreur N	L'erreur calculée pour le composant Nord ajusté, dans le unités du projet.
Est	Le composant Est ajusté du point, dans les unités du système de coordonnées.
Erreur E	L'erreur calculée pour le composant Est ajusté, dans le unités du projet.
Elévation	Le composant de coordonnée Elévation ajusté pour le point, dans les unités du projet.
erreur é	L'erreur calculée pour le composant de coordonnée Elévation ajusté, dans le unités du projet.
Fixe	Les points contraints dans l'ajustement et le composant de coordonnée contraint. Les composants de coordonnée contraints comprennent horizontal seul (2D), vertical seul (Hauteur ou Elévation), ou horizontal et vertical.
Les codes suivants s'affichent dans la colonne Fixe pour identifier les composants:

Code	Signification
N E	Horizontal 2D
h	Hauteur
é	Elévation
NOTE: Il se peut que tous les points contraints n'ont pas des erreurs standard a posteriori associées aux composants de coordonnées. Ces erreurs s'affichent comme 0,000. Lorsqu'aucune valeur n'est disponible pour un composant ou les erreurs a posteriori associées, N/A s'affiche dans la colonne.


    Coordonnées géodésiques

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez cette table de statistiques pour afficher les coordonnées géodésiques ajustées de chaque point dans le dernier ajustement. Les coordonnées comprennent les erreurs standard a posteriori, multipliées par le scalaire de sigma univariable , associées à chaque composant de coordonnée.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur  Coordonnées ajustées − Géodésiques.

Les statistiques des Coordonnées géodésiques s'affichent.

Les colonnes suivantes sont comprises:

Colonne	Indiquant
Nom du point	Le nom du point décrit dans les autres colonnes.
Latitude	Le composant de coordonnée de Latitude ajusté dans l'ajustement de datum.
Erreur N	L'erreur calculée pour le composant de coordonnée de Latitude, dans les unités du projet.
Longitude	Le composant de coordonnée de Longitude ajusté dans l'ajustement de datum.
Erreur E	L'erreur calculée pour le composant de coordonnée de Longitude, dans les unités du projet.
Hauteur	La Hauteur ajustée au-dessus du composant de coordonnée d'Ellipsoïde du point, dans les unités du projet.
erreur h	L'erreur calculée pour la Hauteur au-dessus du composant de coordonnée d'Ellipsoïde du point, dans les unités du projet.
Fixe	Les points contraints dans l'ajustement et le composant de coordonnée ajusté. Les composants de coordonnée contraints comprennent horizontal seul (2D), vertical seul (Hauteur d'ellipsoïde ou Elévation), ou horizontal et vertical.
Les codes suivants s'affichent dans la colonne Fixe pour identifier les composants:

Code	Signification
Lat Long	Horizontal 2D
h	Hauteur
é	Elévation
NOTE: Il se peut que tous les points contraints n'ont pas des erreurs standard a posteriori associées aux composants de coordonnées. Ces erreurs s'affichent comme 0,000. Lorsqu'aucune valeur n'est disponible pour un composant ou les erreurs a posteriori associées, N/A s'affiche dans la colonne.


    Statistiques générales

Plus amples informations

 Voir aussi

Vue d'ensemble

Ces statistiques indiquent avec quel degré de succès le réseau s'adapte ensemble.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique.

Les statistiques générales s'affichent.

Un exemple d'une section du rapport s'affiche ci-dessous:

Facteur de référence de réseau :  6.42
Test du chi carré (a=95%) :  ECHEC
Degrés de liberté :  36.00

Les champs suivants sont compris:

Facteur de référence de réseau

Cette valeur vous permet de vous informer avec quel degré de succès les erreurs a priori (pré-ajustement) d'ajustement correspondent aux erreurs a posteriori (post-ajustement).

Le facteur de référence de réseau sert à vous informer si des erreurs au hasard dans les observations sont acceptable et si elles correspondent aux erreurs standard estimées pour ces observations. Le facteur de référence de réseau devrait être approximativement égal à 1,0.

Test du chi carré

Cette valeur vous informe avec quel degré de succès le réseau d'ajustement s'adapte ensemble. Si le facteur de référence est près de 1,0 et les degrés de liberté sont acceptables, et le réseau s'adapte ensemble mathématiquement, et le test du chi carré est admis.

Lors de la réalisation d'un ajustement par les moindres carrées, la fermeture mathématique du réseau est un facteur important. Considérez le test du chi carré comme votre premier indicateur de fermeture mathématique.

Degrés de liberté

Cette valeur vous informe de la quantité générale de redondance dans le réseau. Les degrés de liberté identifient le nombre d'observations indépendantes comprises dans l'ajustement qui étaient utilisées pour surdéterminer les solutions. Le plus grand le nombre, la plus grande la redondance que vous avez dans l'ajustement.

Les nombres de redondance des observations GPS, des observations terrestres et des observations de géoïde sont utilisées collectivement pour déterminer cette valeur de degrés de liberté générale pour le réseau.


    Statistiques des types d'observation

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez ces statistiques pour vous informer du facteur de référence (RF) et nombre de redondance (degrés de liberté) déterminés pour chaque type d'observation; c'est à dire, GPS, terrestre et de géoïde.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique.

La section Statistiques d'observation GPS, Statistiques d'observation terrestres, ou Statistiques d'observation de géoïde s'affiche.

Les Statistiques du modèle de géoïde sont disponibles après le chargement des observations de géoïde.

Pour plus amples informations, référez-vous aux rubriques suivantes:

  Statistiques d'observation GPS

  Statistiques d'observation terrestre

  Statistiques de modèle de géoïde


    Statistiques d'observation GPS

Plus amples informations

 Voir aussi

Vue d'ensemble

Affichez le Facteur de référence et le Nombre de redondance (Degrés de liberté) déterminés pour les observations GPS dans le résumé de Statistiques d'observation GPS des statistiques de types d'observation.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique − Observation GPS.

Les statistiques des Types d'observation GPS s'affichent avec les Statistiques d'observation GPS à l'en-tête de la section.

Les champs suivants sont rapportés:

Facteur de référence

Chaque type d'observation a ses propres erreurs estimées, donc son propre facteur de référence. Cette valeur vous indique combien chaque type d'observation contribue au facteur de référence du réseau. Le logiciel Trimble Geomatics Office vous permet de travailler avec chaque méthode d'observation indépendamment, puis appliquer la quantité d'échelle correcte aux estimations d'erreur de chaque groupe.

Nombre de redondance

Le nombre de redondance, quelques fois dénommé degrés de liberté, est un indicateur de combien chaque observation contribue à la redondance générale. Utilisez cette statistique pour identifier quelles observations manquent de redondance.

Statistiques de groupe de variance GPS

Les champs suivants sont rapportés pour chaque groupe de variance:

  Nom du groupe

  Facteur de référence − Ce champ indique combien chaque groupe de variance contribue au facteur de référence du réseau. Chaque groupe de variance a ses propres erreurs estimées, et donc son propre facteur de référence.

  Nombre de redondance  − Ce champ indique combien de redondance chaque groupe de référence contribue aux degrés de liberté du réseau. Utilisez ce champ pour vérifier si un groupe de variance manque de redondance.

Statistiques d'observation GPS individuelle

Les champs suivants sont rapportés pour chaque observation GPS:

  ID d'observation

  Facteur de référence − Ce champ indique combien chaque observation GPS contribue au facteur de référence du réseau. Chaque observation GPS a ses propres erreurs estimées, et donc son propre facteur de référence.

  Nombre de redondance  − Ce champ indique combien de redondance chaque observation GPS contribue aux degrés de liberté du réseau. Un grand nombre indique plus de redondance. Utilisez ce champ pour vérifier si une observation GPS manque de redondance.


Statistiques d'observation terrestre

Vue d'ensemble

Pour vérifier le facteur de référence et le nombre de redondance (degrés de liberté) déterminés par les observations terrestres, utilisez le résumé Statistiques d'observation terrestre des statistiques pour les types d'observation.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique − Observation terrestre.

La section Statistiques d'observation terrestre s'affiche.

Les champs suivants sont rapportés:

Facteur de référence

Chaque type d'observation a ses propres erreurs estimées, donc son propre facteur de référence. Cette valeur vous indique combien chaque type d'observation contribue au facteur de référence du réseau. Le logiciel Trimble Geomatics Office vous permet de travailler avec chaque méthode d'observation (GPS, terrestre ou de géoïde) séparément pour pondérer chaque groupe d'observation indépendamment. Ainsi vous pouvez appliquer la quantité d'échelle correcte aux estimations d'erreur de chaque groupe

Nombre de redondance

Le nombre de redondance, quelques fois dénommé degrés de liberté, est un indicateur de combien chaque observation contribue à la redondance générale. Utilisez cette statistique pour identifier quelles observations manquent de redondance.

Statistiques terrestres par type

Si les types d'observation suivants sont présents dans l'ajustement, leurs facteurs de référence et leurs nombres de redondance sont affichés:

  Angles horizontaux

  Elévations trigonométriques

  Distances ellipsoïdales

  Elévations delta

  Azimuts

Statistiques de groupe de variance terrestre

Les champs suivants sont rapportés pour chaque groupe de variance:

  Nom du groupe

  Facteur de référence − Ce champ indique combien chaque groupe de variance contribue au Facteur de référence du réseau. Chaque groupe de variance a ses propres erreurs estimées, et donc son propre Facteur de référence.

  Nombre de redondance − Ce champ indique combien de redondance chaque groupe de variance contribue aux degrés de liberté du réseau. Utilisez ce champ pour vérifier si un groupe de variance manque de redondance.


    Statistiques du modèle de géoïde

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez le résumé des Statistiques d'observation de géoïde des Statistiques des types d'observation pour vous informer du facteur de référence et du nombre de redondance (degrés de liberté) déterminés pour les observations de géoïde.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Résumé statistique − Modèle de géoïde.

Les Statistiques de modèle de géoïde s'affichent.

Les champs suivants sont rapportés:

Facteur de référence

Chaque type d'observation a ses propres erreurs estimées, donc son propre facteur de référence (RF). Cette valeur vous indique combien chaque type d'observation contribue au facteur de référence du réseau. Le logiciel Trimble Geomatics Office vous permet de travailler avec chaque méthode d'observation (GPS, terrestre ou de géoïde) séparément pour pondérer chaque groupe d'observation indépendamment, puis appliquer la quantité d'échelle correcte aux estimations d'erreur de chaque groupe.

Nombre de redondance

Le nombre de redondance, dénommé degrés de liberté pour le réseau général, est un indicateur de combien chaque observation contribue à la redondance générale. Utilisez cette statistique pour identifier quelles observations manquent de redondance.


    Observations GPS ajustées

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez les observations dans la table Observations GPS ajustées pour:

  Vérifier le nombre d'observations GPS utilisées dans l'ajustement.

  Evaluer les erreurs standard a posteriori de chaque composant d'observation.

  Identifier les composants d'observations GPS qui dépassent le Tau critique défini pour le réseau (hors des normes). Les observations suspectes sont soulignées en rouge pour aider l'identification des hors des normes.

  Identifier toute transformation et toute estimation de grande erreur inattendue dans les paramètres.

Les champs suivants peuvent précéder la table Observations GPS ajustées:

NOTE: Les champs Paramètre de transformation sont rapportés basés sur l'état du paramètre. L'état du paramètre produira les valeurs rapportées suivantes:

Non utilisé − Un groupe de paramètres configuré sur l'état non utilisé aura le résultat d'aucune valeur rapportée.

Défini de l'utilisateur − Un groupe de paramètres configuré sur l'état défini de l'utilisateur s'affichera comme la valeur configurée de l'utilisateur sans tenir compte du nombre de composants de coordonnée contraints.

Calculé − Un paramètre configuré sur l'état calculé s'affichera après la contrainte du nombre requis de composants de coordonnée.

Pour plus amples informations concernant la définition et le calcul des paramètres de transformation, référez-vous à Paramètres de transformation - Vue d'ensemble .

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur  Observations ajustées − GPS

Les statistiques des Observations GPS ajustées s'affichent.

Les statistiques suivantes sont comprises:

Groupe de transformation GPS

Ce champ affiche le nom de chaque groupe de transformation compris dans l'ajustement. Ce champ sert également comme un titre pour distinguer entre les informations rapportées pour chaque groupe de transformation.

Déviation de longitude

Ces champs indiquent la valeur et l'erreur estimée du paramètre Déviation de longitude. Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

NOTE: C'est différent d'un groupe de transformation de géoïde dans lequel il y a une exigence minimum de six hauteurs (3 hauteurs orthométriques et 3 ellipsoïdales ) et un point 2D sont fixes.

Déviation de latitude

Ces champs indiquent la valeur et l'erreur estimée du paramètre Déviation de latitude Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

NOTE: C'est différent d'un groupe de transformation de géoïde dans lequel il y a une exigence minimum de six hauteurs (3 hauteurs orthométriques et 3 ellipsoïdales ) et un point 2D sont fixes.

Rotation d'azimut

Ces champs indiquent la valeur et l'erreur estimée du paramètre Rotation d'azimut. Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

Echelle du réseau

Ces champs indiquent la valeur et l'erreur estimée du paramètre Echelle du réseau .Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

Echelle de distance

Ces champs indiquent la valeur et l'erreur estimée du paramètre Echelle de distance. Cette valeur est utilisée pour éliminer une erreur systématique dans les distances.

Constante de distance

Ces champs indiquent la valeur et l'erreur estimée du paramètre Constante de distance. Cette valeur est utilisée pour éliminer une erreur systématique dans les distances.

Constante de hauteur

Ces champs indiquent la valeur et l'erreur estimée du paramètre Constante de hauteur. Ce paramètre élimine l'erreur de hauteur du système.

Nombre d'observations

Ce champ affiche le nombre total des observations GPS comprises dans l'ajustement.

Nombre des hors des normes

Ce champ affiche le nombre total des hors des normes (les observations GPS avec des résidus élevés) trouvées dans l'ajustement.

Ajustement d'observation (Tau critique = #)

Ce champ affiche la valeur de Tau critique utilisée dans l'ajustement. Ce champ est suivi immédiatement par la table Observations GPS ajustées.

Les colonnes suivantes sont comprises dans la table Observations GPS ajustées:

Colonne	Indiquant
ID d'observation	Le nom d'enregistrement assigné à l'observation dans le projet. Pour les Observation GPS, le numéro d'ID est précédé par le caractère "B".
De point	Le nom du point de début.
Vers point	Le nom du point de fin.
Observations	Les valeurs ajustées des composants d'observation GPS.
Erreur a posteriori (valeur Sigma)	L'erreur estimée a posteriori des composants d'observation GPS. Le scalaire sigma configuré dans le style d'ajustement est affiché dans l'en-tête de la colonne.
Résidu	Le résidu d'observation des composants d'observation GPS.
Résidu std	Le résidu standardisé des composants d'observation GPS. Le résidu standardisé vous permet de faire une comparaison directe entre les erreurs d'une mesure angulaire et les erreurs d'une mesure linéaire.


Observations terrestres ajustées

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez les observations dans la table Observations terrestres ajustées pour effectuer le suivant:

  Vérifier le nombre d'observations terrestres utilisées dans l'ajustement.

  Evaluer les erreurs standard a posteriori de chaque composant d'observation.

  Identifier les composants d'observations terrestres qui dépassent le Tau critique défini pour les hors des normes du réseau. Les observations suspectes sont soulignées en rouge pour aider l'identification des hors des normes.

  Identifier toute transformation et toute estimation de grande erreur inattendues dans les paramètres

Les champs suivants peuvent précéder la table Observations terrestres ajustées:

NOTE: Les champs Paramètre de transformation sont rapportés basés sur l'état du paramètre. L'état du paramètre produira les valeurs rapportées suivantes:

Non utilisé − Un groupe de paramètres configuré sur l'état non utilisé aura le résultat d'aucune valeur rapportée.

Défini de l'utilisateur − Un groupe de paramètres configuré sur l'état défini de l'utilisateur s'affichera comme la valeur configurée de l'utilisateur sans tenir compte du nombre de composants de coordonnée contraints.

Calculé − Un paramètre configuré sur l'état calculé s'affichera après la contrainte du nombre requis de composants de coordonnée.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur  Observations ajustées -Terrestres. Les statistiques des Observations ajustées s'affichent.

Les statistiques suivantes sont comprises:

Groupe de transformation terrestre

Ce champ affiche le nom de chaque groupe de transformation compris dans l'ajustement. Ce champ sert également comme un titre pour distinguer entre les informations rapportées pour chaque groupe de transformation.

Déviation de longitude

Ces champs indiquent la valeur et l'erreur estimée du paramètre Déviation de longitude. Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

NOTE: C'est différent d'un groupe de transformation de géoïde dans lequel il y a une exigence minimum de six hauteurs (3 hauteurs orthométriques et 3 ellipsoïdales ) et un point 2D sont fixes.

Déviation de latitude

Ces champs indiquent la valeur et l'erreur estimée du paramètre Déviation de latitude Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

NOTE: C'est différent d'un groupe de transformation de géoïde dans lequel il y a une exigence minimum de six hauteurs (3 hauteurs orthométriques et 3 ellipsoïdales ) et un point 2D sont fixes.

Rotation d'azimut

Ces champs indiquent la valeur et l'erreur estimée du paramètre Rotation d'azimut. Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

Echelle du réseau

Ces champs indiquent la valeur et l'erreur estimée du paramètre Echelle du réseau. Cette valeur est calculée et rapportée lorsqu'un minimum de trois hauteurs et un point 2D sont fixes.

Echelle de distance

Ces champs indiquent la valeur et l'erreur estimée du paramètre Echelle de distance. Cette valeur est utilisée pour éliminer une erreur systématique dans les distances.

Constante de distance

Ces champs indiquent la valeur et l'erreur estimée du paramètre Constante de distance. Cette valeur est utilisée pour éliminer une erreur systématique dans les distances.

Constante de hauteur

Ces champs indiquent la valeur et l'erreur estimée du paramètre Constante de hauteur. Ce paramètre élimine l'erreur de hauteur du système.

Nombre d'observations

Ce champ affiche le nombre total des observations GPS comprises dans l'ajustement.

Nombre des hors des normes

Ce champ affiche le nombre total des hors des normes (les observations GPS avec des résidus élevés) trouvées dans l'ajustement.

Ajustement d'observation (Tau critique = #)

Ce champ affiche la valeur de Tau critique utilisée dans l'ajustement. Ce champ est suivi immédiatement par la table Observations GPS ajustées.

Les colonnes suivantes sont comprises dans la table Observations terrestres ajustées:

Colonne	Indiquant
ID d'observation	Le nom d'enregistrement assigné à l'observation dans le projet. Pour les observations terrestres, le numéro d'ID est précédé par le caractère "T".
Point de visée arrière	Le nom du point de visée arrière.
Point occupé	Le nom du point occupé.
Point de visée avant	Le nom du point de visée avant.
Observation	Les valeurs ajustées des composants d'observation terrestre.
Erreur a posteriori (valeur Sigma)	L'erreur estimée a posteriori des composants d'observation terrestre. Le scalaire sigma configuré dans le style d'ajustement est affiché dans l'en-tête de la colonne.
Résidu	Le résidu d'observation des composants d'observation terrestre.
Résidu std	Le résidu standardisé des composants d'observation terrestre. Le résidu standardisé vous permet de faire une comparaison directe entre les erreurs d'une mesure angulaire et les erreurs d'une mesure linéaire.


    Observation de géoïde ajustées

Plus amples informations

 Voir aussi

Vue d'ensemble

Utilisez ces statistiques pour étudier les informations suivantes concernant les observations de géoïde ajustées:

  La valeur de Tau critique utilisée dans l'ajustement

  L'observation de géoïde avec son a posteriori standard (estimée) associée, son résidu, et ses résidus standardisés

  Les observation marquées en rouge comme hors des normes

  Les paramètres de transformation avec leurs estimations d'erreur associées (ajustement contrainte complètement)

  Un résumé des observations de géoïde utilisées dans l'ajustement et une table contenant des informations concernant toutes les observations de géoïde.

Utilisez les observations dans la table Observations de géoïde ajustées pour:

  Vérifier le nombre d'observations de géoïde utilisées dans l'ajustement.

  Evaluer les erreurs standard a posteriori de chaque composant d'observation.

  Identifier les composants d'observations de géoïde qui dépassent le Tau critique défini pour les hors des normes du réseau. Les observations suspectes sont soulignées en rouge pour aider l'identification des hors des normes.

  Identifier toute transformation et toute estimation de grande erreur inattendues dans les paramètres

Les champs suivants peuvent précéder la table Observations de géoïde ajustées:

NOTE: Les champs Paramètre de transformation sont rapportés basés sur l'état du paramètre. L'état du paramètre produira les valeurs rapportées suivantes:

Non utilisé − Un groupe de paramètres configuré sur l'état non utilisé aura le résultat d'aucune valeur rapportée.

Défini de l'utilisateur − Un groupe de paramètres configuré sur l'état défini de l'utilisateur s'affichera comme la valeur configurée de l'utilisateur sans tenir compte du nombre de composants de coordonnée contraints.

Calculé − Un paramètre configuré sur l'état calculé s'affichera après la contrainte du nombre requis de composants de coordonnée.

Référez-vous à Paramètres de transformation − Vue d'ensemble (Lien hypertexte) pour plus amples informations concernant la définition et le calcul des Paramètres de transformations.

Pour accéder à ces statistiques:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur  Observations ajustées − Géoïde. Les statistiques des Observations de géoïde ajustées s'affichent.

Les statistiques suivantes sont disponibles:

Groupe de transformation de géoïde

Ce champ affiche le nom du groupe de transformation de géoïde compris dans. Etant donné que seul le groupe de transformation par défaut existe, cette partie de la section du rapport listera toujours le groupe de transformation <Géoïde par défaut>.

Déviation de longitude

Ces champs indiquent la valeur et l'erreur estimée du paramètre Déviation de longitude. Pour les groupes de transformation de géoïde, cette valeur est calculée et rapportée lorsqu'un minimum de six hauteurs (3 hauteurs orthométriques et 3 ellipsoïdales) et un point 2D point sont fixés. C'est différent d'une transformation GPS dans laquelle il y a une exigence minimum de trois hauteurs et un point 2D sont fixes.

Déviation de latitude

Ces champs indiquent la valeur et l'erreur estimée du paramètre Déviation de latitude. Pour les groupes de transformation de géoïde, cette valeur est calculée et rapportée lorsqu'un minimum de six hauteurs (3 hauteurs orthométriques et 3 ellipsoïdales) et un point 2D point sont fixés. C'est différent d'une transformation GPS dans laquelle il y a une exigence minimum de trois hauteurs et un point 2D sont fixes.

Constante de hauteur

Ces champs liste la valeur et l'erreur estimée du paramètre Constante de hauteur . Cette valeur est calculée et rapportée lorsqu'un minimum d'une élévation et une hauteur sont fixes.

NOTE: Les paramètres de Rotation d'azimut, Echelle du réseau, Echelle de distance, et Constante de distance ne sont pas utilisés lors de la transformation des hauteurs de géoïde.

Nombre d'observations

Ce champ affiche le nombre total des observations de géoïde utilisées dans l'ajustement de réseau.

Nombre des hors des normes

Ce champ affiche le nombre total des hors des normes (les observations GPS avec des résidus élevés) trouvés dans l'ajustement.

Ajustement d'observation (Tau critique = #)

Ce champ affiche la valeur de Tau critique utilisée dans l'ajustement. Ce champ est suivi immédiatement par la table Observations de géoïde ajustées.

Les colonnes suivantes sont comprises dans la table Observations de géoïde ajustées:

Colonne	Indiquant
ID d'observation	Le nom d'enregistrement assigné à l'observation de géoïde  dans le projet. Pour les observations de géoïde, le numéro d'ID est précédé par le caractère "G".
Nom du point	Le nom des points utilisés pour extraire des observations de géoïde du modèle de géoïde.
Séparation	La valeur ajustée.
Erreur a posteriori (valeur Sigma)	L'erreur estimée a posteriori des composants d'observation de géoïde. Le scalaire sigma configuré dans le style d'ajustement est affiché dans l'en-tête de la colonne.
Résidu	Le résidu d'observation des composants d'observation de géoïde.
Résidu std	Le résidu standardisé des composants d'observation de géoïde. Le résidu standardisé vous permet de faire une comparaison directe entre les erreurs d'une mesure angulaire et les erreurs d'une mesure linéaire.
NOTE: Si des corrélations sont calculées pour le géoïde, alors toutes les séparations ajustées auront des résidus. Si des corrélations ne sont pas calculées, seuls les points avec des contraintes verticales auront des résidus de géoïde.


Paramètre de style d'ajustement

Vue d'ensemble

Dans cette section du rapport, affichez un résumé des paramètres qui ont été effectués pour l'ajustement de réseau. Pour accéder aux paramètres d'ajustement de réseau:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Paramètres d'ajustement de réseau.

Les paramètres d'ajustement de réseau suivants sont affichés:

Tolérances résiduelles

Les paramètres de tolérance résiduelle sont affichées pour les valeurs suivantes:

  Pour finir itérations

  Limite de convergence finale

Affichage de covariance

Les informations des Paramètres d'erreur horizontale suivantes sont affichées:

  Erreur linéaire propagée [E]:

  Terme constant [C]

  Echelle sur erreur linéaire [S]

Les informations suivantes concernant les paramètres en trois dimensions sont affichées:

  Erreur linéaire propagée [E]:

  Terme constant [C]

  Echelle sur erreur linéaire [S]

En plus cette section affiche si vous avez sélectionné l'option Utiliser les erreurs d'élévation si disponibles.

Contrôles d'ajustement

Les informations suivantes sont affichées:

  Calculer les corrélations du géoïde

  Si un ajustement horizontal ou vertical (ou les deux) a été effectué.

NOTE: Cette section ne s'affiche que si l'ajustement comprend des observations terrestres.

Erreurs d'installation

Les erreurs d'installation GPS suivantes sont affichées:

  Erreur dans Hauteur d'antenne:

  Erreur de centrage

Les erreurs d'installation terrestre  suivantes sont affichées:

  Erreur dans Hauteur d'instrument

  Erreur de centrage

NOTE: Les erreurs d'installation terrestre ne sont listées que si des observations terrestres sont comprises dans l'ajustement.

Pour plus amples informations concernant les Erreurs d'installation, référez-vous à Erreurs d'installation.


Dialogue Configuration du rapport d'ajustement de réseau

Vue d'ensemble

Utilisez ce dialogue pour sélectionner les informations affichées dans le Rapport d'ajustement de réseau.

Pour ce faire:

  Sélectionnez Rapports / Configuration / Rapport d'ajustement de réseau. Le dialogue Configuration du rapport d'ajustement de réseau s'affiche.

Les éléments que vous pouvez afficher dans le Rapport d'ajustement de réseau sont:

  les Statistiques d'observation GPS individuelle

  les Coordonnées de grille ajustées

  les Coordonnées géodésiques ajustées

  les Deltas de coordonnées

  les Comparaisons de coordonnées de contrôle

  les Ellipses d'erreur de point

  Les termes de covariance

NOTE: Pour des grands projets, la génération des affichages des Ellipses d'erreur de point et des Termes de covariance prend beaucoup de temps. Désactivez ces options dans le dialogue Configuration du rapport d'ajustement de réseau afin de générer les rapports plus rapidement.


Comparaisons de coordonnées de contrôle

Vue d'ensemble

Si vous effectuez un ajustement sur un point avec des coordonnées de qualité de contrôle non contrainte, le rapport d'Ajustement de réseau indique la différence entre les coordonnées de point de contrôle non contraint et les coordonnées de point de contrôle ajusté.

Pour afficher les comparaisons de coordonnées de contrôle:

1.	Sélectionnez Rapports / Rapport d'ajustement de réseau. L'afficheur HTML par défaut se démarre et le Rapport d'ajustement de réseau s'affiche avec l'En-tête d'ajustement en haut.

2.	Dans le Contenu à gauche de l'écran, cliquez sur Comparaisons de coordonnées de contrôle.

Les comparaisons de coordonnées de contrôle sont indiquées dans une table avec les champs suivants:

Nom du point

Le nom du point avec une qualité de contrôle.

Valeurs delta

Les différences entre les coordonnées de contrôle non contraintes et les coordonnées de contrôle ajustées sont indiquées pour le:

  Delta nord

  Delta est

  Delta élévation

  Delta hauteur

NOTE: Les différences sont indiquées sous forme de:

Différence de coordonnées de contrôle = coordonnée de contrôle − coordonnée ajustée


    Commande Ajuster

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour effectuer un ajustement de réseau.

Avant d’utiliser cette commande, vérifiez que tous les Paramètres de style d’ajustement sont corrects, que les coordonnées des points de contrôle sont configurées et que des observations sont disponibles.

Pour procéder à un ajustement, effectuez l’une des opérations suivantes :

  Sélectionnez Ajustement / Ajuster.

  Appuyez sur F10.

L’ajustement commence.

Après chaque itération d’ajustement, une observation résiduelle est calculée à l’aide de deux programmes différents. La différence entre les deux résultats de calcul est comparée à la tolérance Pour finir itérations. Sur la base de cette comparaison, l’une des actions suivantes a lieu :

  Si la différence entre les résidus d’observation calculés est inférieure à la tolérance Pour finir itérations, les itérations d’ajustement s’arrêtent. Le message suivant est inclus dans le Rapport d’ajustement de réseau : « Ajustement réussi dans # itération(s) », où ## correspond au nombre d’itérations requises pour converger le réseau.

  Si la différence entre les résidus d’observation calculés est supérieure à la tolérance Pour finir itérations, les itérations d’ajustement continuent. Si l’ajustement continue jusqu’à ce que les Itérations maximum soient atteintes, le Seuil de convergence finale est utilisé (voir ci-dessous).

Entrez la tolérance du seuil de convergence pour l’itération finale de l’ajustement du réseau. Le logiciel utilise cette valeur pour déterminer si l’ajustement de réseau a réussi lorsque l’itération finale ne dépasse pas la tolérance Pour finir itérations.

Si la différence calculée pour le résidu d’observation de la dernière itération d’ajustement est supérieure à la tolérance Pour finir itérations, le résidu est comparé au Seuil de convergence finale et l’une des actions suivantes a lieu :

  Si la différence calculée pour le résidu d’observation est inférieure au Seuil de convergence finale, l’ajustement a réussi et le message suivant s’affiche : « Convergence finale réussie après ## itérations (seuil de convergence finale) », où ## correspond au nombre d’itérations requises pour converger le réseau.

  Si le résidu d’observation est supérieur au Seuil de convergence finale, l’ajustement échoue et un dialogue d’avertissement s’affiche indiquant « Echec d’ajustement. Aucune convergence ».

Pour de plus amples informations sur le procédé d’ajustement de réseau, référez-vous à Ajustement de réseau.

Pour de plus amples informations sur les itérations et les calculs réalisés lors de ce procédé, référez-vous à Tolérances résiduelles.


    Commande Styles d'ajustement

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour afficher, créer, copier, éditer, renommer et supprimer des styles d’ajustement.

Pour afficher le dialogue Styles d’ajustement de réseau :

  Sélectionnez Ajustement / Styles d’ajustement.


    Commande Datum

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour choisir le datum utilisé dans l’ajustement.

Pour afficher le sous-menu Datum :

  Sélectionnez Ajustement / Datum.

Le sous-menu Datum s’affiche avec les commandes suivantes :

  WGS-84

  Datum du projet


    Commande Groupes d'observation

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour définir les groupes de variance et de transformation utilisés dans l’ajustement.

Pour afficher le sous-menu Groupes d’observation :

  Sélectionnez Ajustement / Groupes d’observation.

Le sous-menu Groupes s’affiche avec les commandes suivantes :

  Groupes de variance

  Groupes de transformation


    Commande Rapport d'ajustement de réseau

Plus amples informations

Comment ...	Rapport	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour afficher le Rapport d’ajustement de réseau.

Pour afficher le dialogue Rapport d’ajustement de réseau :

  Sélectionnez Rapports / Rapport d’ajustement de réseau. Le rapport est généré en format HTML et l’afficheur HTML par défaut de l’ordinateur est automatiquement lancé pour afficher les données de rapport.

Pour de plus amples informations sur le rapport, référez-vous à Rapport d’ajustement de réseau.


    Commande Observations

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour afficher et évaluer les observations. Cette commande vous permet d’inclure des observations de l’ajustement de réseau ou de les exclure.

Pour afficher le dialogue Observations :

  Sélectionnez Ajustement / Observations.


    Commande Points

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour ouvrir le dialogue Points, avec des options pour l’affichage, la configuration et la suppression de l’état Fixe des composants de coordonnées des points de contrôle utilisés dans un ajustement de réseau :

Pour afficher le dialogue Points :

  Sélectionnez Ajustement / Points.


    Commande Datum du projet

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Utilisez cette commande pour sélectionner le datum du projet comme datum utilisé dans l’ajustement. Le datum du projet est configuré dans la tabulation Système de coordonnées du dialogue Propriétés du projet. Le datum du projet est utilisé lorsque vous effectuez un ajustement contraint complètement ou un ajustement contraint imperceptiblement sur les données terrestres.

Pour sélectionner le datum du projet :

  Sélectionnez Ajustement / Datum / Datum du projet − <datum>. Une coche s’affiche à coté de Datum du projet − <datum>.


    Commande Supprimer ajustement

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour supprimer l’ajustement courant.

Pour supprimer les valeurs ajustées :

  Sélectionnez Ajustement / Supprimer ajustement.

Utilisez cette option pour redonner à votre réseau la configuration qu’il avait avant l’ajustement. Par exemple, lorsque vous utilisez cette commande :

  le datum est configuré sur WGS-84

  aucun point n’a un état fixe

  les ellipses d’erreur sont supprimées

  les observations de géoïde sont déchargées

  les scalaires sont restaurés à l’option Toutes les observations et aux options par défaut

NOTE : Les observations qui étaient désactivées pour l’ajustement et celles pour lesquelles la case à cocher Utiliser dans ajustement de réseau est désélectionnée ne sont pas restaurées à leur état précédent.


    Commande Groupes de transformation

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour définir les groupes de transformation d’observations utilisés dans l’ajustement.

Pour afficher le dialogue Groupes de transformation:

  Sélectionnez Ajustement / Groupes d’observation / Groupes de transformation.


    Commande Groupes de variance

Plus amples informations

Comment ...	Dialogue	Voir aussi
Sélectionnez cette commande pour définir les groupes de variance d’observations utilisés dans l’ajustement.

Pour afficher le dialogue Groupes de variance :

  Sélectionnez Ajustement / Groupes d’observation / Groupes de variance.


    Commande WGS-84

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour utiliser WGS-84 comme datum de l’ajustement. Le datum WGS-84 doit être utilisé lors de la réalisation d’un ajustement contraint imperceptiblement sur des observations GPS.

Pour sélectionner le datum WGS-84 :

  Sélectionnez Ajustement / Datum / WGS-84. Une coche s’affiche à côté de WGS-84.


    Commande Stratégies de pondération

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour afficher le dialogue Stratégies de pondération avec les options permettant de définir et d’appliquer les stratégies de pondération scalaires utilisées dans l’ajustement.

Pour afficher le dialogue Stratégies de pondération :

  Sélectionnez Ajustement / Stratégies de pondération.


    Commande Enregistrer (Coordonnées de calibration)

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour enregistrer les coordonnées de calibration après avoir effectué un ajustement GPS contraint imperceptiblement. Les coordonnées de calibration consistent en des latitudes, longitudes et hauteurs d’ellipsoïde WGS-84, lesquelles sont générées lors de l’ajustement contraint imperceptiblement.

Ces coordonnées sont utilisées comme coordonnées GPS lors de la réalisation d’une calibration de site avec le logiciel Trimble Geomatics Office.

Pour afficher le dialogue Enregistrer coordonnées de calibration :

  Sélectionnez Ajustement / Coordonnées de calibration / Enregistrer.

NOTE : Cette commande n’est pas disponible lorsque vous utilisez le datum du projet pour ajuster le réseau ni lorsque l’ajustement comporte des données terrestres.

NOTE : Lorsque des coordonnées de calibration sont enregistrées, une coordonnée de calibration WGS-84 est enregistrée pour le point.


    Commande Supprimer (Coordonnées de calibration)

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Les coordonnées de calibration sont des latitudes, longitudes et hauteurs d’ellipsoïde WGS-84, lesquelles sont générées lors de la réalisation d’un ajustement GPS contraint imperceptiblement sur le datum WGS-84. Sélectionnez cette commande pour les supprimer du projet :

  Sélectionnez Ajustement / Coordonnées de calibration / Supprimer.


    Commande Désactiver observation

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande lorsque vous souhaitez complètement désactiver une observation figurant dans la liste d’observations d’ajustement. La désactivation complète d’une observation entraîne sa suppression de la liste Observations et l’observation en question n’est plus utilisée pour les ajustements ni pour les recalculs.

NOTE : La désactivation d’une observation n’équivaut pas à l’exclusion d’une observation. Les observations exclues continuent de figurer dans la liste Observations mais ne sont pas traitées dans les ajustements ni dans les recalculs.

Pour désactiver une observation :

1.	Sélectionnez Ajustement / Observations. Le dialogue Observations s'affiche.

2.	Cliquez avec le bouton droit de la souris sur l’observation appropriée pour accéder au menu de raccourcis puis sélectionnez Désactiver observation.

L’observation est supprimée de la liste Observations et n’est plus utilisée dans les ajustements ni dans les recalculs.

Vous ne pouvez pas réactiver une observation à partir du dialogue Observations. Par contre, vous pouvez sélectionner l’observation et réactiver ses propriétés désactivées à partir de la fenêtre graphique. L’observation est réactivée en changeant son état de désactivé à activé.


    Commande Coordonnées de calibration

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour afficher un sous-menu avec des commandes vous permettant d’enregistrer et de supprimer les coordonnées de calibration.

Pour accéder au sous-menu :

  Sélectionnez Ajustement / Coordonnées de calibration.

Un menu s’affiche avec les commandes suivantes :

  Enregistrer

  Supprimer


    Dialogue Enregistrer coordonnées de calibration

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Utilisez le dialogue Enregistrer coordonnées de calibration pour sélectionner la manière dont les coordonnées de calibration sont enregistrées.

NOTE : Cette option n’est disponible que lorsque le datum d’ajustement est configuré sur WGS-84 et que seules les observations GPS ont été ajustées.

Pour y accéder :

  Sélectionnez Ajustement / Coordonnées de calibration / Enregistrer.

Le groupe Enregistrer coordonnées pour calibration comprend les options suivantes :

Points existants

Si vous choisissez de les enregistrer sous les Points existants, les coordonnées sont enregistrées comme une coordonnée supplémentaire appelée Groupe de calibration.

Nouveaux points avec suffixe

Si vous choisissez de les enregistrer sous Nouveaux points avec suffixe : GPS, un nouvel enregistrement de point est créé avec le nom du point « <Nom du point>-GPS> ». Vous pouvez modifier le suffixe « GPS » avant d’enregistrer les coordonnées de calibration.

Pour de plus amples informations, référez-vous à Enregistrement de coordonnées de calibration.


    Barre d'outils Contrôles d'ellipse

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

La barre d’outils Contrôles d’ellipse vous permet de filtrer les ellipses d’erreur, les flèches d’erreur de hauteur et les flèches d’erreur d’élévation qui s’affichent dans la fenêtre graphique après l’ajustement. Des contrôles sont également fournis pour la mise à l’échelle des ellipses d’erreur et l’ajustement de la taille des coches.

Pour afficher la barre d’outils Contrôles d’ellipse :

  Dans l’Affichage du levé, sélectionnez Affichage / Barres d’outils / Contrôles d’ellipse.

  Au niveau de la barre d’outils de l’affichage du levé, cliquez avec le bouton droit de la souris et sélectionnez Contrôles d’ellipse.

La barre d’outils Contrôles d’ellipse s’affiche. Vous pouvez sélectionner cette commande à nouveau pour masquer la barre d’outils.

NOTE : Vous pouvez également utiliser la tabulation Contrôles d’ellipse d’erreur du dialogue Options d’affichage pour contrôler l’affichage des ellipses d’erreur.

La barre d’outils comprend les boutons disponibles suivants :

	Ce bouton bascule la commande Ellipses d’erreur. La bascule de cette commande correspond à la sélection et à la désélection de la case à cocher Afficher ellipses d’erreur de point et flèches du dialogue Options d’affichage. Les commandes (boutons) Erreurs de hauteur et Erreurs d’élévation deviennent disponibles lorsque ce bouton est sélectionné.
	Ce bouton bascule la commande Erreurs de hauteur et n’est disponible que lorsque la commande Ellipses d’erreur a été sélectionnée.
	Ce bouton bascule la commande Erreur d’élévation et n’est disponible que lorsque la commande Ellipses d’erreur a été sélectionnée.

Ces contrôles sont également disponibles :

Echelle d’ellipse d’erreur

L’Echelle d’ellipse d’erreur, représentée ci-dessous, vous permet de contrôler la taille des ellipses d’erreur qui s’affichent dans la fenêtre graphique après un ajustement.

La taille de l’ellipse peut être réduite en faisant glisser le contrôle vers la gauche et augmentée en le faisant glisser vers la droite.

Taille des coches

Ce contrôle, représenté ci-dessous, permet d’ajuster la distance entre les coches de l’échelle de la barre d’ellipse d’erreur.

Les sélecteurs rotatifs contrôlent la distance entre les coches affichées dans la Fenêtre graphique. L’échelle de barre s’allonge lorsque sa taille est augmentée, tandis que la distance entre les coches est ajustée pour correspondre à la valeur affichée dans le contrôle Taille des coches. Le phénomène inverse se produit lorsque le paramètre de coche de l’échelle de barre est réduit.


    Commande Contrôles d'ellipse

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour afficher ou masquer la barre d’outils Contrôles d’ellipse.

Pour afficher ou masquer la barre d’outils Contrôles d’ellipse :

  Sélectionnez Affichage / Barres d’outils / Contrôles d’ellipse.

La barre d’outils est affichée ou masquée chaque fois que cette commande est exécutée.

NOTE : Vous pouvez également configurer les contrôles d’ellipse d’erreur à partir de la tabulation Contrôles d’ellipse d’erreur du dialogue Options d’affichage.


    Commande Ellipses d'erreur

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

La commande Ellipses d’erreur est disponible sur la barre d’outils Contrôles d’ellipse. Cette commande permet de filtrer les Ellipses d’erreur et les Flèches qui s’affichent dans la fenêtre graphique après un ajustement. Les boutons de commande Erreurs de hauteur et Erreurs d’élévation de la barre d’outils deviennent disponibles lorsque cette commande est sélectionnée.

NOTE : La commande Ellipses d’erreur correspond à la sélection de la case à cocher Ellipses d’erreur de point et flèches du dialogue Options d’affichage. La modification de l’état de cette case à cocher change également le paramètre courant du bouton Ellipses d’erreur. Pour de plus amples informations, référez-vous à Filtrage des ellipses d’erreur et des flèches.

Pour sélectionner la commande Ellipses d’erreur :

1.	Afficher la barre d’outils Contrôles d’ellipse.

Pour de plus amples informations, référez-vous à Afficher et masquer la barre d’outils Contrôles d’ellipse.

2.	Pour filtrer les Ellipses d’erreur et les Flèches, cliquez sur [image].

Les Ellipses d’erreur sont affichées ou masquées en fonction de leur état d’origine au moment où vous avez cliqué sur le bouton. Les boutons Erreurs de hauteur et Erreurs d’élévation deviennent disponibles lorsque le bouton Ellipses d’erreur est sélectionné. Si les barres d’outils Flèches d’erreur de hauteur et Flèches d’erreur d’élévation sont sélectionnées, les Flèches de hauteur et/ou d’élévation sont également affichées.


    Commande Erreurs de hauteur

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour filtrer les flèches d’erreur de hauteur qui s’affichent dans la fenêtre graphique après un ajustement.

NOTE : Vous devez sélectionner la commande Ellipses d’erreur de la barre d’outils Contrôles d’ellipse ou la case à cocher Afficher ellipses d’erreur de point et flèches du dialogue Options d’affichage pour que cette commande devienne disponible.

Pour sélectionner la commande Erreurs de hauteur :

1.	Afficher la barre d’outils Contrôles d’ellipse.

2.	Pour filtrer les Ellipses d’erreur et les Flèches, cliquez sur [image]. Les Ellipses d’erreur sont affichées ou masquées en fonction de leur état d’origine au moment où vous avez cliqué sur le bouton. Le bouton Erreurs de hauteur devient disponible lorsque le bouton Ellipses d’erreur est sélectionné.

3.	Dans la barre d’outils Contrôles d’ellipse, cliquez sur [image].

Les Flèches de hauteur s’affichent ou sont masquées chaque fois que vous cliquez sur ce bouton.


    Commande Erreurs d'élévation

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Sélectionnez cette commande pour filtrer les flèches d’erreur d’élévation qui s’affichent dans la fenêtre graphique après un ajustement.

NOTE :  La commande Ellipses d’erreur de barre d’outils Contrôles d’ellipse ou la case à cocher Afficher ellipses d’erreur de point et flèches du dialogue Options d’affichage doit être sélectionnée pour que cette commande devienne disponible.

Pour sélectionner la commande Erreurs d’élévation :

1.	Afficher la barre d’outils Contrôles d’ellipse.

Pour de plus amples informations, référez-vous à Afficher et masquer la barre d’outils Contrôles d’ellipse.

2.	Pour filtrer les Ellipses d’erreur et les Flèches, cliquez sur [image]. Les Ellipses d’erreur sont affichées ou masquées en fonction de leur état d’origine au moment où vous avez cliqué sur le bouton. Le bouton Erreurs d’élévation devient disponible lorsque le bouton Ellipses d’erreur est sélectionné.

3.	Dans la barre d’outils Contrôles d’ellipse, cliquez sur [image].

Les Flèches d’élévation s’affichent ou sont masquées chaque fois que vous cliquez sur ce bouton.


Afficher ou masquer la barre d'outils Contrôles d'ellipse

 Vue d'ensemble et plus amples informations

Vue d'ensemble

La barre d’outils Contrôles d’ellipse peut être utilisée pour contrôler la taille et l’affichage des ellipses d’erreur et des flèches qui s’affichent dans la fenêtre graphique.

Pour afficher la barre d’outils Contrôles d’ellipse, effectuez l'une des opérations suivantes :

  Dans l’Affichage du levé, sélectionnez Affichage / Barres d’outils / Contrôles d’ellipse.

  Au niveau de la barre d’outils de l’Affichage du levé, cliquez avec le bouton droit de la souris et sélectionnez Contrôles d’ellipse.

La barre d’outils Contrôles d’ellipse s’affiche.


Modifier la taille d'affichage des ellipses d'erreur

Vue d'ensemble

La taille des Ellipses d’erreur qui s’affichent dans la fenêtre graphique peut être augmentée ou diminuée.

Pour modifier la taille d’affichage des Ellipses d’erreur :

1.	Afficher la barre d’outils Contrôles d’ellipse.

Pour de plus amples informations, référez-vous à Afficher et masquer la barre d’outils Contrôles d’ellipse.

2.	Dans l’Echelle d’ellipse d’erreur, effectuez l’une des opérations suivantes :

  Faites glisser l’Echelle d’ellipse d’erreur vers la gauche pour diminuer la Taille d’ellipse.

  Faites glisser l’Echelle d’ellipse d’erreur vers la droite pour augmenter la Taille d’ellipse.

La taille des Ellipses d’erreur est ajustée.


Ajuster les coches de l'échelle de la barre Ellipses d'erreur

Vue d'ensemble

La distance entre les coches de l’échelle de la barre Ellipses d’erreur peut être ajustée à partir de la barre d’outils Contrôles d’ellipse.

Pour ajuster la distance entre les coches de l’échelle de la barre Ellipses d’erreur :

1.	Afficher la barre d’outils Contrôles d’ellipse.

Pour de plus amples informations, référez-vous à Afficher et masquer la barre d’outils Contrôles d’ellipse.

2.	A partir du contrôle Taille des coches, effectuez l’une des opérations suivantes :

  Cliquez sur le sélecteur rotatif inférieur pour réduire la distance entre les coches de l’échelle de la barre Ellipses d’erreur.

  Cliquez sur le sélecteur rotatif supérieur pour augmenter la distance entre les coches de l’échelle de la barre Ellipses d’erreur.

L’échelle de barre s’allonge lorsque sa taille est augmentée, tandis que la distance entre les coches est ajustée pour correspondre à la valeur affichée dans le contrôle Taille des coches. Le phénomène inverse se produit lorsque le paramètre de coche de l’échelle de barre est réduit.


Filtrer les ellipses d'erreur et les flèches

Plus amples informations

Voir aussi	Comment ...
Vue d'ensemble

Les ellipses d’erreur et les flèches qui s’affichent dans la fenêtre graphique après un ajustement peuvent être filtrées à partir de la barre d’outils Ellipses d’erreur ou du dialogue Options d’affichage.

NOTE : La case à cocher Afficher ellipses d’erreur de point et flèches du dialogue Options d’affichage et le bouton Ellipses d’erreur de la barre d’outils Contrôles d’ellipse sont reliés. Le basculement d’un paramètre affecte également l’autre contrôle. L’utilisation de la barre d’outils Contrôles d’ellipse présente des avantages supplémentaires. Pour de plus amples informations, référez-vous à Barre d’outils Contrôles d’ellipse.

Pour filtrer les ellipses d’erreur et les flèches à partir de la barre d’outils Contrôles d’ellipse :

1.	Affichez la barre d’outils Contrôles d’ellipse.

2.	Pour filtrer les ellipses d’erreur et les flèches, cliquez sur [image]. Les ellipses d’erreur sont affichées ou masquées en fonction de leur état d’origine au moment où vous avez cliqué sur le bouton. Les boutons Erreurs de hauteur et Erreurs d’élévation deviennent disponibles lorsque le bouton Ellipses d’erreur est sélectionné. Si les barres d’outils Flèches d’erreur de hauteur et Flèches d’erreur d’élévation sont sélectionnées, les Flèches de hauteur et/ou d’élévation sont également affichées.

3.	A partir de la barre d’outils Contrôles d’ellipse, effectuez l’une des opérations suivantes :

  Pour filtrer les flèches de hauteur, cliquez sur [image].

  Pour filtrer les flèches d’élévation, cliquez sur [image].

Les flèches de hauteur ou d’élévation s’affichent ou sont masquées chaque fois que vous cliquez sur l’un de ces boutons.

Pour filtrer les ellipses d’erreur et les flèches à partir du dialogue Options d’affichage :

1.	Sélectionnez Affichage / Options. Le dialogue Options d'affichage s'affiche.

2.	Sélectionnez la tabulation Contrôles d’erreur d’ellipse.

3.	Sélectionnez la case à cocher Afficher ellipses d’erreur de point et flèches.

Les ellipses d’erreur et les flèches sont activées ou désactivées chaque fois que la case à cocher est sélectionnée.


    Fenêtre Propriétés - Page Estimation d'erreur

Plus amples informations

 Voir aussi

Vue d'ensemble

La page Estimation d’erreur contient les erreurs de point déterminées après un ajustement de réseau. Cette page s'affiche uniquement si le module Ajustement de réseau est installé sur votre ordinateur. Vous pouvez afficher cette page de propriétés après avoir effectué un ajustement.

Pour afficher la page Estimation d’erreur :

1.	Cliquez deux fois sur le point que vous souhaitez afficher. La fenêtre Propriétés s’affiche avec le point sélectionné.

2.	Dans la tabulation Levé, cliquez sur le bouton Estimation d’erreur [image].

La page Estimation d’erreur s’affiche. Elle contient les champs suivants :

Nord, Est

Affiche les erreurs standard des composants de coordonnées horizontaux.

Elévation, hauteur

Affiche les erreurs standard des composants de coordonnées verticaux.

Confiance

Affiche le niveau de confiance des résultats d’erreurs propagées.