Copyright: © 1999-2001 Trimble Navigation Limited


Abandonner une session de traitement GPS

 Vue d'ensemble et plus amples informations

Une fois qu'une session de traitement de lignes de base GPS commence, le processeur effectue une séquence continue de passes de traitement sur chacune des lignes de base sélectionnées. Le nombre de passes et les actions effectuées sur chaque passe sont influencés par les paramètres du Style de traitement GPS et les résultats des passes précédentes. Vous pouvez abandonner ce procédé pour annuler la session de traitement GPS courante.

Lorsque le traitement GPS est abandonné, le processeur arrêtera le traitement dès que le message Annuler est reçu.  Il faut noter, cependant, que dans certaines situations il se peut qu'il y a un délai entre le moment que vous cliquez sur Annuler et le moment que le processeur de lignes de base reçoit ce message.

Pour abandonner le traitement GPS:

1.	Clique sur Annuler. Le processeur GPS affiche un message de vérification.

2.	Effectuez l'une des choses suivantes:

  Cliquez sur Oui pour confirmer l'annulation de la session de traitement.

  Cliquez sur Non pour continuer la session de traitement et abandonner l'annulation.


Ajuster la période de temps d'une occupation

 Vue d'ensemble et plus amples informations

La période de temps d'une Occupation statique ou d'une Occupation cinématique continu peut être ajustée à une période de temps d'une durée plus courte. La période de temps peut être ajustée par:

  l'édition des propriétés d'occupation.

  l'édition directe d'un élément d'occupation.

Les instructions pour l'ajustement de la période de temps utilisant les deux méthodes se trouve ci-dessous.

Pour ajuster la période de temps des propriétés d'occupation:

1.	Pour afficher les propriétés de l'occupation, effectuez l'une des choses suivantes:

  Double-cliquez sur l'élément d'occupation.

  Cliquez avec le bouton droit de la souris sur l'élément d'occupation, et sélectionnez Propriétés.

Le dialogue Occupation/Propriétés de segment de données s'affiche.

2.	Editez les champs de Heure de début et Heure de fin.

Il est seulement possible de réduire la durée de la période de temps.

3.	Cliquez sur OK.

Le dialogue ferme et les modifications sont reflétées dans l'apparence de l'élément d'occupation. L'élément apparaît sous forme d'un rectangle avec un bord noir. Le bord noir indique la période de temps originel de l'élément d'occupation et la zone rectangulaire remplie de couleur, dans le rectangle, indique la période de temps occupée par l'élément d'occupation édité.

Pour ajuster la période de temps:

1.	Déplacez la souris sur le bord en tête de l'élément d'occupation.

Le curseur devient une double flèche horizontale.

2.	Appuyez sur et maintenez enfoncé le bouton gauche de la souris.

3.	Regardez la Règle de temps pendant que vous déplacez le bord en tête de l'occupation à droite.

Lorsque le bord en tête se déplace, la couleur de remplissage se déplace en unisson avec la souris, mais le bord rectangulaire noir reste en place.

NOTE: Vous pouvez utiliser la partie vide d'un élément d'occupation (une zone sans aucune couleur de remplissage) comme un indicateur que la période de temps d'une occupation a été éditée.

4.	Relâchez le bouton gauche de la souris lorsque le bord en tête de l'occupation est aligné avec la période de temps correct dans la Règle de temps.

5.	Répétez les étapes ci-dessus pour ajuster le bord traînant de l'occupation, mais inverser le mouvement de la souris.


Analyser un Rapport de traitement de lignes de base GPS

 Vue d'ensemble et plus amples informations

Après le traitement de lignes de base GPS, il se peut que des indicateurs d'avertissement s'affichent dans la fenêtre de graphiques. Pour les lignes de base GPS, un indicateur s'affiche au centre des lignes de base qui n'ont pas réussi à un ou plusieurs tests d'acceptance de qualité comme défini dans le Style de traitement GPS actif. Il faut étudier de plus près les lignes de base marquées pour déterminer pourquoi elles ont reçu l'indicateur, et des techniques de résolution des problèmes peuvent être requises pour améliorer la qualité en général de la solution de lignes de base par un retraitement utilisant un style de traitement GPS différent.

Analysez et corrigez progressivement les données de chaque ligne de base séparément. Corrigez tout problème trouvé dans une ligne de base spécifique et retraitez la ligne de base avant d'analyser la ligne de base suivante.

Regardez les statistiques du Rapport de traitement de lignes de base GPS de la ligne de base, et posez les questions suivantes:

  Quel est le type de solution?

  Quelle est la comparaison entre le ratio et la variance de référence?

  Quelle est la distance inclinée?

  Est-ce-qu'il y a une ligne de base superflue mesurée à un temps différent pour comparer les distances inclinées et les composants de ligne de base?

Si les réponses sont en doute, demandez:

  Pour combien de temps était le temps d'occupation?

  Le RMS est-il moins de 15 mm?

  Est-ce-que les résumés de poursuite montrent des écarts dans les segments traités?

  Est-ce-que les reports résiduels tournent symétriquement autour de zéro dans une étendue de 15mm?

Pour analyser les résultats des tests de Ratio, Variance de référence, et RMS, vous devez comprendre les critères utilisés pour accepter ou rejeter les solutions de lignes de base.

D'autres paramètres de style de traitement GPS peuvent influencer les résultats de ces tests d'acceptance. Il faut obtenir une bonne connaissance de ces paramètres afin de comprendre comment les solutions sont acceptées et rejetées. Pour plus amples informations, référez-vous au dialogue Editer style avancé.

Ces techniques de résolution des problèmes peuvent ou ne peuvent pas améliorer les statistiques de lignes de base. Il faut les essayer une à la fois avant de retourner sur le terrain. Les techniques sont listées en ordre de simplicité et d'efficacité. La résolution des problèmes peut rendre la réobservation d'une ou plusieurs lignes de base sur le terrain superflue.

Résolution des problèmes:

  Désactivation d'un satellite

  Edition des dérapages de cycle

  Edition des données de limite non valides

  Evaluation et élévation du masque d'élévation

Pour plus amples informations concernant les sessions de traitement de lignes de base, référez-vous au Journal de traitement de lignes de base.


Analyser les données de poursuite de satellites sur les reports SV

 Vue d'ensemble et plus amples informations

Une fois que les informations de poursuite de satellites sont tracées dans la fenêtre Report SV, il est possible d'analyser les données pour des inconsistances.

Les reports multiples des informations de poursuite de satellites peuvent également être tracés dans la même fenêtre de Report SV afin de comparer les données. Il est également possible de créer des nouvelles fenêtres pour afficher les groupes supplémentaires d'un ou plusieurs reports.

En sus du traçage des données sur l'écran, il est possible d'imprimer les reports et les informations utilisées pour générer le report peuvent être exportées à un fichier au format tabulaire.

Pour tracer les données:

1.	Pour afficher Timeline, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

Le Timeline s'affiche.

2.	Cliquez sur un dossier de données.

Les dossiers de données s'affichent dans la barre de contrôle. Un symbole [image] s'affiche lorsque les dossiers de données sont fermés and un [image] s'affiche lorsqu'ils sont ouverts.

Les dossiers de données affichent le modèle et le numéro de série du récepteur utilisé pour collecter les données. Vous pouvez double-cliquer sur un dossier de données pour afficher les propriétés du récepteur associées aux données collectées.

Lorsqu'ils sont ouverts, des icônes s'affichent dans la barre de contrôle pour tous les satellites poursuivis pendant la période de temps du levé.

NOTE: Au lieu d'ouvrir des dossiers individuels, la commande Agrandir tout peut être utilisée pour ouvrir tous les dossiers de données.

3.	Double-cliquez sur une Icône de satellite.

La fenêtre Report SV s'affiche.

4.	Pour afficher les reports des informations de poursuite de satellites, effectuez l'une des choses suivantes:

  Sélectionnez un ou plusieurs reports en cliquant sur les boutons des barres de dialogue.

  Sélectionnez une ou plusieurs commandes du sous-menu Affichage / Données.

Toutes les données applicables collectées pour le satellite sélectionné pendant la période de temps d'observation sont tracées.

5.	Vérifiez visuellement les informations de poursuite de satellites et recherchez des inconsistances dans les données.

Une fois que le report est affiché, vous pouvez effectuer les actions suivantes aussi:

Pour afficher les mesures de report:

1.	Déplacez le curseur de la souris à travers le report jusqu'à l'emplacement requis.

2.	Lisez les informations des mesures et de l'heure dans la barre d'état.

La valeur enregistrée à l'emplacement de la souris et l'heure à laquelle les données ont été enregistrées s'affichent dans la barre d'état.

Pour imprimer le report:

1.	Pour sélectionner la commande Imprimer, effectuez l'une des choses suivantes:

  Sélectionnez Fichier / Imprimer.

  Appuyez sur Ctrl+P.

  Dans la barre d'outils, cliquez sur [image].

Le dialogue Imprimer s'affiche.

2.	Sélectionnez les options requises.

3.	Cliquez sur OK.

Le report est imprimé.

Pour imprimer le report dans un fichier:

1.	Pour sélectionner la commande Imprimer, effectuez l'une des choses suivantes:

  Sélectionnez Fichier / Imprimer.

  Appuyez sur Ctrl+P.

  Dans la barre d'outils, cliquez sur [image].

Le dialogue Imprimer s'affiche.

2.	Sélectionnez l'option Imprimer dans un fichier.

3.	Cliquez sur OK.

Le report est imprimé dans un fichier. Beaucoup de programmes peuvent importer des données graphiques imprimées dans un fichier. Ce sert lors de l'inclusion des reports dans les rapports.

Pour imprimer les données tabulaires:

1.	Pour sélectionner la commande Exporter, effectuez l'une des choses suivantes:

  Sélectionnez Fichier / Exporter.

  Appuyez sur Alt+FE.

Le dialogue Exporter fichier s'affiche.

2.	Sélectionnez le répertoire et le nom du fichier pour le stockage du fichier.

Les informations de poursuite de satellites utilisées pour générer le report sont écrites dans un fichier texte (*.txt) et stockées dans le dossier sélectionné. Lorsque des reports multiples sont affichés dans la même fenêtre de Report SV, une colonne de données tabulaires est comprise pour chaque type de report.


Changer un type d'occupation statique

 Vue d'ensemble et plus amples informations

Le Type d'occupation d'une Occupation statique peut être modifié.

Pour changer le type d'occupation:

1.	Double-cliquez sur l'élément d'occupation. Le dialogue Occupation/Propriétés de segments de données s'affiche.

2.	Ouvrez la liste Type de segment.

3.	Pour sélectionner le Type d'occupation, choisissez l'une des options suivantes:

  Occupation statique

  Segment continu

  Segment mobile

4.	Cliquez sur OK.

Les modifications sont enregistrées.

WARNING:  Vous ne pouvez pas modifier un Segment continu ou un Segment mobile à une Occupation statique à nouveau, une fois que la modification a prise effet. Il faut faire attention lors d'effectuer cette modification.


Modifier un type de segment continu

 Vue d'ensemble et plus amples informations

Le Type d'occupation d'un Segment cinématique continu peut être modifié.

Pour changer le type d'occupation:

1.	Double-cliquez sur l'élément d'occupation. Le dialogue Occupation/Propriétés de segments de données s'affiche.

2.	Ouvrez la liste Type de segment.

3.	Pour sélectionner le Type d'occupation, choisissez l'une des options suivantes:

  Segment continu

  Segment mobile

4.	Cliquez sur OK.

Les modifications sont enregistrées.

NOTE:  Vous ne pouvez modifier qu'un Segment continu à un Segment mobile. Il n'est pas possible de changer un Segment mobile ou continu à une Occupation.


Changer les options de l'heure

 Vue d'ensemble et plus amples informations

Les unités de l'heure dans la Règle de temps peuvent être configurées sur Semaine GPS/secondes ou l'heure locale Windows.

Pour modifier les unités de l'heure:

1.	Pour afficher le dialogue Options d'heure, effectuez l'une des choses suivantes:

  Double-cliquez dans la Règle de temps.

  Cliquez avec le bouton droite de la souris dans la Règle de temps et sélectionnez Options d'heure.

Le dialogue Options d'heure s'affiche.

2.	Sélectionnez l'un des formats d'heure suivants:

  Heure locale, correspondant au format de l'affichage d'heure de Windows

  Semaines GPS/Secondes

3.	Cliquez sur OK.

Les champs de Heure de début et Heure de fin dans la Règle de temps sont mis à jour pour indiquer la modification aux unités d'heure. Cette opération également a un effet sur les unités d'heure affichées dans les dialogues de propriétés de Timeline, Plan du ciel, Report DOP, Report SV et la barre d'état.


Corriger les dérapages de cycle dans les observations GPS

 Vue d'ensemble et plus amples informations

Les Dérapages de cycle trouvés dans les reports de poursuite de satellites d'une observation GPS peuvent être édités afin de les supprimer de façon sélective des sessions de traitement de lignes de base GPS futures. Les dérapages de cycle ne devraient être édités que dans les cas où une ligne de base est marquée à cause des résidus d'observation élevés et de nombreux dérapages de cycles sont découverts à l'aide de Timeline.

NOTE: Dans la plupart des cas, le processeur de lignes de base traite les dérapages de cycle automatiquement et l'édition manuelle n'est pas requise. Les dérapages de cycle peuvent être détectés avant et après le traitement de lignes de base GPS par l'étude des observations GPS dans Timeline. Les données problématiques ont une apparence distinctive dans les reports de poursuite de satellites dans les observations GPS. L'apparence des dérapages de cycle et d'autres écarts dans les informations de poursuite de satellites sont illustrés dans Observations GPS.

Pour éditer les dérapages de cycle:

1.	Imprimez le rapport de Traitement de lignes de base GPS pour la ligne de base marquée.

Trimble vous recommande d'imprimer les résultats du traitement pour la solution de ligne de base marquée avant de continuer. Lorsque la solution de ligne de base est traitée plus tard, vous pouvez utiliser les données pour comparer les résultats aux résultats collectés pour la session de traitement de lignes de base GPS suivante.

2.	Etudiez les observations GPS pour des signes visibles de dérapages de cycle.

3.	Faites glisser déplacer un rectangle de sélection autour du dérapage de cycle.

Timeline automatiquement sélectionne les informations de poursuite pour les phases porteuses L1 et L2 . Dans l'étape 6, vous aurez l'option de supprimer les données de phase porteuse L1 et L2 sélectionnées.

4.	Pour afficher les propriétés d'observation GPS, effectuez l'une des choses suivantes:

  Double-cliquez sur le rectangle de sélection.

  Cliquez avec le bouton droit de la souris sur le rectangle de sélection et sélectionnez Propriétés.

Le dialogue Propriétés d'observation GPS s'affiche.

5.	Editez un ou les deux champs Heure de début et Heure de fin.

Si vous ajustez les heures afin d'ignorer les données, le dérapage de cycle est supprimé des sessions de traitement de lignes de base GPS futures. Plus tard lorsque vous retraitez les lignes de base, en effet le processeur ignore ces données lors de la détermination des nouvelles solutions pour la ligne de base marquée.

6.	Effacez les coches des Types d'observation applicables. Ainsi il est déterminé quels Types d'observation seront désactivés pour la période de temps spécifiée.

7.	Cliquez sur OK pour appliquer vos modifications. Le dialogue ferme, et la couleur des données de poursuite des satellites désactivées dans le rectangle de sélection devient grises, indiquant que les données ne seront plus utilisées par le processeur pour déterminer une solution de lignes de base dans les sessions de traitement futures.

8.	Pour retraiter les lignes de base, sélectionnez Levé / Traiter lignes de base GPS. Le dialogue Traitement GPS s'affiche et le traitement de lignes de base commence.

9.	Sélectionnez la solution de la  liste de Traitement GPS.

10.	Cliquez sur Rapport. Le Rapport de traitement de lignes de base GPS s'affiche.

11.	Comparez les nouveaux résultats de traitement de la ligne de base aux résultats de la session de traitement de lignes de base précédente.

12.	Après la comparaison des résultats des deux sessions de traitement de lignes de base, effectuez l'une des choses suivantes:

  Si la distance inclinée de la ligne de base et les statistiques se sont améliorées, enregistrez la solution de ligne de base dans votre réseau.

  Lorsqu'aucune amélioration n'est indiquée, retournez au dialogue Propriétés d'observation GPS, réactivez les types d'observation désactivées, et cliquez sur OK.


Corriger les données de limites non valides dans les observation GPS

 Vue d'ensemble et plus amples informations

La découverte des données de limites non valides dans les reports de poursuite de satellites d'une observation GPS est un événement rare par comparaison à la découverte des dérapages de cycle. Dans le cas improbable que ce se produit, les données de limites non valides peuvent être éditées afin de les supprimer de façon sélective des sessions de traitement de lignes de base GPS. Les données de limites non valides ne devraient être éditées que dans les cas où une solution de lignes de base est marquée à cause des résidus d'observation élevés et des données de limites non valides sont découvertes lors d'une étude plus détaillée dans Timeline.

NOTE: Les données de limites non valides peuvent être détectées avant et après le traitement de lignes de base GPS par l'étude des observations GPS dans Timeline. Les données problématiques ont une apparence distinctive dans les reports de poursuite de satellites dans les observations GPS. L'apparence des données de limites non valides, des dérapages de cycle et d'autres écarts dans les informations de poursuite de satellites sont illustrés dans Observations GPS.

Pour éditer les données de limites non valides:

1.	Imprimez le rapport de Traitement de lignes de base GPS pour la ligne de base marquée.

Trimble vous recommande d'imprimer les résultats du traitement pour la solution de ligne de base marquée avant de continuer. Lorsque la solution de ligne de base est traitée plus tard, vous pouvez utiliser les données pour comparer les résultats aux résultats collectés pour la session de traitement de lignes de base GPS suivante.

2.	Etudiez les observations GPS pour des signes visibles de données de limites non valides.

3.	Faites glisser déplacer un rectangle de sélection autour des données de limites non valides.

Timeline automatiquement sélectionne les informations de poursuite pour les phases porteuses L1 et L2 . Dans l'étape 6, vous aurez l'option de supprimer les données de phase porteuse L1 et L2 sélectionnées.

4.	Pour afficher les propriétés d'observation GPS, effectuez l'une des choses suivantes:

  Double-cliquez sur le rectangle de sélection.

  Cliquez avec le bouton droit de la souris sur le rectangle de sélection et sélectionnez Propriétés.

Le dialogue Propriétés d'observation GPS s'affiche.

Editez un ou les deux champs Heure de début et Heure de fin.

Si vous ajustez les heures afin d'ignorer les données, les données de limites non valides sont supprimées des sessions de traitement de lignes de base GPS futures. Plus tard lorsque vous retraitez les lignes de base, en effet le processeur ignore ces données lors de la détermination des nouvelles solutions pour la ligne de base marquée.

6.	Effacez les coches des Types d'observation applicables. Ainsi il est déterminé quels Types d'observation seront désactivés pour la période de temps spécifiée.

7.	Cliquez sur OK pour appliquer vos modifications. Le dialogue ferme, et la couleur des données de poursuite des satellites désactivées dans le rectangle de sélection devient grises, indiquant que les données ne seront plus utilisées par le processeur pour déterminer une solution de lignes de base dans les sessions de traitement futures.

8.	Pour retraiter les lignes de base, effectuez l'une des choses suivantes:

  Sélectionnez Levé / Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le traitement de lignes de base commence.

9.	Sélectionnez la solution de la liste de Traitement GPS .

10.	Cliquez sur Rapport. Le rapport de Traitement de lignes de base GPS s'affiche.

11.	Comparez les nouveaux résultats de traitement aux résultats de la session de précédente.

12.	Après la comparaison des résultats des deux sessions de traitement, effectuez l'une des choses suivantes:

  Si la ligne de base s'est améliorée, enregistrez la solution de ligne de base dans votre projet

  Lorsqu'aucune amélioration n'est indiquée, retournez à l'icône de satellite et réactivez les mesures de ce satellite.


Désactiver un satellite

 Vue d'ensemble et plus amples informations

Vous pouvez étudier les observations GPS dans Timeline afin de comprendre les problèmes de traitement de lignes de base. Certaines conditions pouvant causer des problèmes comprennent:

  les dérapages de cycle, une phase non valide, et de nombreux écarts dans la poursuite L1 ou L2 .

  une mauvaise géométrie de satellites, surtout lorsqu'un ou plusieurs satellites sont désactivés.

NOTE: La désactivation d'un satellite également désactive toutes les observations GPS associées au satellite. Il est possible de désactiver les observations GPS individuelles et sélectionner des zones d'une observation GPS. Pour plus amples informations, référez-vous à Corriger les dérapages de cycle et Corriger les données de limites non valides.

Pour désactiver un satellite:

ATTENTION: Avant de désactiver un satellite, vérifiez que la géométrie de la constellation de satellites ne sera pas influencée de façon défavorable par la suppression de ce satellite.

1.	Pour afficher Timeline, effectuez l'une de choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyer sur Alt+VI.

Timeline s'affiche.

2.	Identifiez le dossier de données contenant les données. Puis trouvez l'élément de levé contenant le temps dont vous voulez désactiver des satellites. Utilisez la commande Zoom à l'étendue pour agrandir l'élément de levé afin de remplir l'Afficheur de période de temps.

Vous pouvez identifier le dossier applicable de deux façons: le dossier lui-même affiche le numéro de modèle du récepteur et le numéro de série, et l'élément de levé comprend une étiquette avec l'ID de la session de levé.

3.	Pour ouvrir le dossier de données, cliquez sur [image].

Les icônes de chaque satellite contribuant des données au levé s'affichent dans la barre de contrôle, et l'Afficheur de période de temps affiche les éléments d'observation GPS pour chaque satellite.

NOTE: Si vous devez afficher les données de tous les satellites dans l'Afficheur de période de temps, redimensionnez la zone d'affichage de Timeline.

4.	Analysez les éléments d'observation GPS pour des écarts.

Des écarts dans les phases porteuses L1 et L2 pourraient indiquer des dérapages de cycle de signaux de satellite, des erreurs de limites non valides et d'autres problèmes de perte de signal. Pour plus amples informations concernant l'apparence du dérapage de cycle et d'autres problèmes de perte de phase porteuse, référez-vous à Observations GPS.

5.	Cliquez avec le bouton droit de la souris sur une icône de Satellite.

6.	Sélectionnez Activer/Désactiver. L'élément d'observation GPS s'affiche en gris lorsque les données sont désactivées.

7.	Sélectionnez la ligne de base.

8.	Pour retraiter la solution, effectuez l'une des choses suivantes:

  Sélectionnez Levé / Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le traitement de lignes de base commence.

9.	Sélectionnez la solution de la liste de Traitement GPS .

10.	Cliquez sur Rapport. Le rapport de Traitement de lignes de base GPS s'affiche.

11	Comparez les nouveaux résultats de traitement aux résultats de la session précédente.

12.	Après la comparaison des résultats des deux sessions de traitement, effectuez l'une des choses suivantes:

  Si la ligne de base s'est améliorée, enregistrez la solution de ligne de base dans votre projet

  Lorsqu'aucune amélioration n'est indiquée, retournez à l'icône de satellite et réactivez les mesures de ce satellite.


Désactiver les Observations GPS dans Timeline

 Vue d'ensemble et plus amples informations

Dans Timeline, vous pouvez désactiver les éléments d'observation GPS individuels, les groupes d'observations GPS ou toutes les observations GPS pour une satellite spécifique. Avant de désactiver un satellite, vérifiez que la géométrie de la constellation de satellites ne sera pas influencée de façon défavorable par la suppression de ce satellite.

NOTE: Les zones d'observations GPS sélectionnées et les informations de poursuite de satellites brutes  sélectionnées peuvent être éditées pour améliorer la qualité d'observation en général. Pour un exemple de cette technique, référez-vous à Corriger les données de limites non valides.

Pour désactiver les observations GPS individuelles

1.	Cliquez sur l'observation GPS activée.

2.	Cliquez avec le bouton droit de la souris sur l'observation GPS.

3.	Sélectionnez Activer/Désactiver.

L'observation GPS activée est désactivée, et son apparence change afin d'afficher son état désactivé.

Pour désactiver les groupes d'observations GPS:

1.	Faites glisser déplacer un rectangle autour du groupe d'observations GPS.

2.	Cliquez avec le bouton droit de la souris dans le rectangle de sélection.

3.	Sélectionnez Activer/Désactiver.

Les  observations GPS activées sont désactivées, et leur apparence change afin d'afficher leur état désactivé.

Pour désactiver toutes les observations GPS d'un satellite spécifique:

1.	Cliquez sur l'icône de satellite associée aux observations GPS.

2.	Cliquez avec le bouton droit de la souris sur l'icône.

3.	Sélectionnez Activer/Désactiver.

Le satellite et toutes les observations GPS associées sont désactivés.


Editer les critères d'acceptance du traitement GPS

Trois tests de qualité du traitement GPS (le test de Ratio, le test de Variance de référence et le test RMS) servent comme les critères d'acceptance de qualité pour l'acceptance et le rejet des solutions de lignes de base.

Pour éditer les critères d'acceptance:

1.	Pour afficher le dialogue Styles de traitement GPS, effectuez l'une des choses suivantes:

  Sélectionnez Levé / Styles de traitement GPS.

  Appuyez sur Alt+HAUT.

Le dialogue Styles de traitement GPS s'affiche

2.	Sélectionnez le style actif de la liste.

3.	Cliquez sur Edition. Le dialogue Editer style s'affiche avec le nom du style dans la barre de titres.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Qualité . Le groupe de Critères d'acceptance comprend des cases à cocher pour activer et désactiver les trois tests d'acceptance. Dans le dialogue ils sont dénommés les champs Si Ratio, Si Variation de référence et Si RMS. Quatre champs d'entrée de données sont compris pour chaque test. Deux groupes de Marquer et Echec existent; un groupe est pour des récepteurs à monofréquence et l'autre est pour des récepteurs à bi-fréquence.

NOTE:  Il y a deux circonstances quand les critères d'acceptance de monofréquence sont utilisés pour une ligne de base. La première est lorsqu'au  moins un des récepteurs pour la ligne de base est un récepteur à monofréquence. La deuxième est lorsque la longueur de la ligne de base est inférieur au seuil de Passe finale spécifié sur la tabulation Iono du Style de traitement GPS actif.

6.	Sélectionnez ou effacez la case à cocher Si Ratio pour activer ou désactiver le test d'acceptance de ratio.

7.	Entrez une valeur de Marquer pour les récepteurs à monofréquence ou bi-fréquence.

8.	Entrez une valeur d'Echec pour les récepteurs à monofréquence ou bi-fréquence.

9.	Sélectionnez ou effacez la case à cocher Si Variation de référence pour activer ou désactiver le test d'acceptance de variance de référence.

10.	Entrez une valeur de Marquer pour les récepteurs à monofréquence ou bi-fréquence.

11.	Entrez une valeur d'Echec pour les récepteurs à monofréquence ou bi-fréquence.

12.	Sélectionnez ou effacez la case à cocher Si RMS pour activer ou désactiver le test d'acceptance de RMS.

13.	Entrez une valeur de Marquer pour les récepteurs à monofréquence ou bi-fréquence.

14.	Entrez une valeur d'Echec pour les récepteurs à monofréquence ou bi-fréquence.

15.	Editez Editer multiplicateur et cliquez sur OK.

Les modifications sont enregistrées.

NOTE: Il n'est pas nécessaire de modifier les critères d'acceptance pour la plupart des applications de levé. Cependant, l'exception est pour les solutions de passe finale à code seul. En général les solutions à code seul sont marquées basé sur les critères fournis dans le style de traitement par défaut de Trimble. Si vous traitez les solutions de finale à code seul de façon routinière, Trimble vous recommande de configurer un style de traitement à code seul avec des critères d'acceptance appropriés.


Editer les options d'événement du style de traitement GPS

Les options d'Evénements dans le style de traitement GPS déterminent comment les positions d'événement sont dérivées lors du traitement des levés cinématique continu avec des indicateurs d'événement.

Pour éditer les options d'Evénement:

1.	Ouvrez le dialogue Editer style avancé .

2.	Dans la tabulation Evénements , sélectionnez l'une des options de Méthode d'interpolation.

3.	Dans les champs restants, saisissez le suivant:

  Le nombre de points de faire entrer

  Les époques manquantes maximum permises

  Le décalage d'heure (en microsecondes)

4.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options d'iono du style de traitement GPS

 Vue d'ensemble et plus amples informations

Les options Ionosphériques dans le style de traitement GPS sont utilisées pour compenser des erreurs ionosphériques lors de la réalisation des itérations de traitement Résolution d'ambiguïté et Final.

Pour éditer les options Ionosphériques:

1.	Ouvrez le dialogue Editer style avancé .

2.	Sélectionnez la tabulation Iono .

3.	Dans le groupe Passe de résolution d'ambiguïté, sélectionnez ou effacez la case à cocher Appliquer à toute ligne de base dépassant pour activer ou désactiver cette option. Si l'option est activée, saisissez la valeur de distance appropriée.

4.	Dans le groupe Passe finale, sélectionnez ou effacez la case à cocher Appliquer à toute ligne de base dépassant pour la Passe finale pour activer ou désactiver cette option. Si l'option est activée, saisissez la valeur de distance appropriée.

5.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options cinématique du style de traitement GPS

Les options Cinématique dans le style de traitement GPS sont appliquées lors du traitement des observations Cinématique.

Pour éditer les options Cinématique:

1.	Ouvrez le dialogue Editer style avancé .

2.	Sélectionnez la tabulation Cinématique .

3.	Dans les champs appropriés, saisissez le suivant:

  Le temps d'observation de référence minimum (en secondes)

  Le temps d'observation d'initialisation statique minimum (en secondes)

  L'initialisation minimum de point connu (un ratio)

  Le temps de traitement minimum OTF (en vol) (en secondes)

4.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options de Recherche OTF du style de traitement GPS

Les options de Recherche OTF dans le style de traitement GPS sont utilisées pour effectuer des recherches en vol pendant les itérations de traitement GPS.

Pour éditer les options de Recherche OTF:

1.	Ouvrez le dialogue Editer style avancé .

2.	Sélectionnez la tabulation Recherche OTF .

3.	Dans le groupe Méthode de recherche, sélectionnez l'option appropriée. Si vous sélectionnez les options Recherche séquentielle en avant ou Recherche séquentielle en arrière, le champ dans le groupe Contrôle séquentiel devient disponible.

4.	Saisissez un ratio de recherche minimum.

5.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options de qualité du style de traitement GPS

Les options de Qualité dans le style de traitement GPS sont utilisées pour activer, désactiver, et définir les tests de Ratio, RMS, et Variance de référence utilisés pour évaluer la qualité des lignes de base avant qu'une ligne de base est enregistrée dans le projet.

Les lignes de base qui échouent les critères du test d'acceptance ne sont pas, par défaut, enregistrées dans le projet. Une ligne de base qui est marquée est enregistrée dans le projet mais un indicateur d'avertissement rouge s'affiche au centre de la ligne de base pour indiquer qu'il faut vérifier cette ligne de base afin d'assurer qu'elle s'adapte correctement au réseau. Pour plus amples informations concernant de l'identification de la raison de marquer les lignes de base, référez-vous à Analyse des données.

Pour éditer les options de Qualité:

1.	Ouvrez le dialogue Editer styles avancés .

2.	Sélectionnez la tabulation Qualité .

3.	Dans le groupe Critères d'acceptance de qualité, sélectionnez ou effacez les cases à cocher Si ratio, Si variation de référence et Si RMS pour activer ou désactiver ces tests.

4.	Sélectionnez les champs Marquer et Echec pour chaque test, et saisissez les valeurs requises.

NOTE: Trimble vous recommande de ne pas modifier les paramètres par défaut qui sont appropriés pour la plupart des applications de levé.

5.	Dans le champ Editer multiplicateur, saisissez une valeur.

6.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options Statique du style de traitement GPS

Les options Statique dans le style de traitement GPS sont utilisées lors du traitement des données de lignes de base collectées utilisant des méthodes de levé Statique.

Pour éditer les options Statique:

1.	Ouvrez le dialogue Editer style avancé .

2.	Sélectionnez la tabulation Statique .

3.	Dans le champ Temps minimum d'observation de ligne de base, saisissez une valeur, en secondes.

C'est le temps minimum d'observation de ligne de base qui passe avant de traiter les mesures simultanées collectées de deux ou plusieurs récepteurs. Le processeur requiert 120 secondes de données simultanées afin de traiter une ligne de base entre récepteurs. Ainsi tout chevauchement accidentel est supprimé avec des mobiles multiples. La valeur par défaut est 120 secondes.

4.	Dans le groupe Longueur maximum de ligne de base pour essayer une solution fixe, effectuez l'une des choses suivantes:

  Dans le champ Utilisant éphéméride diffusée, saisissez une distance de ligne de base (dans les unités du projet). La valeur par défaut est 200 kilomètres.

  Dans le champ Utilisant l'éphéméride précise, saisissez une distance de ligne de base (dans les unités du projet). La valeur par défaut est 2000 kilomètres.

5.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options troposphériques du style de traitement GPS

Les options Tropo dans le style de traitement GPS sont utilisées pour appliquer les corrections troposphériques lors du traitement de lignes de base.

Pour éditer les options Tropo:

1.	Ouvrez le dialogue Editer style avancé .

2.	Sélectionnez la tabulation Tropo.

3.	Dans la liste Modèle, sélectionnez le modèle troposphérique approprié.

4.	Dans le champ Intervalle de délai du zénith estimé, saisissez une valeur, dans les unités d'heure.

L'intervalle d'estimation minimum recommandé est une heure. La valeur par défaut est deux heures. Une valeur de zéro (0) ne produit aucune estimation de délai du zénith. Ce champ n'est pas disponible lorsque le modèle troposphérique est configuré sur Aucun.

5.	Sélectionnez la case à cocher Utiliser données de met observées pour sélectionner le type de données météorologiques appliqué lors du calcul des solutions de traitement GPS. Les données Met (Météorologiques) consistent en l'humidité relative, la pression barométrique et la température.

  Lorsque cette case à cocher est sélectionnée, les données météorologiques observées qui se trouvent dans le fichier de données ou le fichier RINEX sont utilisées pour modeler le troposphère lors du calcul du délai de zénith troposphérique. Cette case à cocher est sélectionnée par défaut.

  Effacez cette case à cocher pour utiliser les valeurs météorologiques standard au lieu des données météorologiques enregistrées.

6.	Si aucune autre modification n'est requise, cliquez sur OK.

Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les styles de traitement GPS

 Vue d'ensemble et plus amples informations

Deux niveaux de boîtes de dialogue peuvent s'afficher lors de l'édition des styles de traitement GPS. Les paramètres généraux sont affichés en premier et un groupe optionnel de paramètres Expert peuvent être affichés pour perfectionner le style de traitement GPS. Initialement, les deux dialogues utilisent les paramètres de style par défaut du logiciel Trimble Geomatics Office, appropriés à la plupart des applications de levé.

Pour éditer les options de style générales:

1.	Effectuez l'une des choses suivantes:

  Sélectionnez Levé / Styles de traitement GPS.

  Appuyez sur Alt+HAUT.

Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste.

3.	Cliquez sur Edition. Le dialogue Editer style s'affiche.

4.	Dans le champ Masque d'élévation, saisissez une valeur de masque d'élévation. Le masque d'élévation spécifié annule le masque d'élévation utilisé pour collecter les données.

5.	Dans la liste Ephéméride, sélectionnez Diffuser ou Précis. Si Diffuser est sélectionné, le processeur GPS utilise les éphémérides diffusées collectées pour tous les satellites contribuant des données à la session de levé. Si Précis est sélectionné, le processeur de données utilise l'éphéméride précise courante importée dans le projet.

6.	Dans la liste Type de solution, sélectionnez Code, Flottant, ou Fixe.

7.	Effectuez l'une des choses suivantes:

  Lorsque des modifications de paramètres générales sont les seules requises, cliquez sur OK pour enregistrer vos modifications.

  Effectuez la série d'étapes suivante s'il faut éditer les options Expert.

Pour éditer les options Expert:

  Dans le dialogue Editer style, cliquez sur Expert.

Le dialogue Editer style avancé s'affiche. Il contient les tabulations suivantes:

  Statique

  Cinématique

  Global

  Qualité

  Tropo

  Iono

  Evénement

  Recherche OTF

Une fois que vous avez édité les options appropriées dans ce dialogue, cliquez sur OK. Les modifications sont enregistrées et vous êtes retourné au dialogue Editer style.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer les options Global du style de traitement GPS

Les options Global dans le style de traitement GPS sont considérées lors de la réalisation de chaque passe du processeur GPS.

Pour éditer les options Global:

1.	Ouvrez le dialogue Editer style avancé .

2.	Sélectionnez la tabulation Global .

3.	Dans la liste Type de fréquence, sélectionnez L1, L2, Voie étroite, ou Grande voie.

4.	Dans les champs restants, saisissez le suivant:

  le dérapage maximum de cycle ajustable (en secondes)

  les itérations maximum (une valeur de nombre entier) − Le processeur GPS n'effectuera plus que le nombre maximum d'itérations lors du traitement de chaque solution de lignes de base.

  le temps de recherche maximum de nombre entier (une valeur de nombre entier, en minutes) − Le processeur GPS abandonnera des itérations de traitement ultérieures lorsque ce temps est passé, et utilisera une solution flottante.

5.	Lorsqu'aucune autre modification n'est requise, cliquez OK.

Les modifications sont enregistrées.

NOTE: Pour la plupart des applications de levé, il n'est pas nécessaire de modifier les contrôles avancés. Si vous modifiez ces contrôles, assurez-vous de comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications et d'assigner le style révisé comme le style actif.


Editer la distance de ligne de base de la passe de résolution d'ambiguïté

Cette case à cocher rend active ou désactive la correction de modèle ionosphérique lors de la passe de traitement GPS de résolution d'ambiguïté. La valeur de distance saisie dans le champ Appliquer à toute ligne de base dépassant détermine la longueur minimum de ligne de base ou le seuil pour l'application des corrections de modèle ionosphérique.

NOTE: Le modelage ionosphérique ne s'applique qu'aux lignes de base observées avec des récepteurs à bi-fréquence.

Pour éditez cette valeur:

1.	Ouvrez le dialogue Editer style avancé.

2.	Sélectionnez la tabulation Iono .

3.	Dans le groupe Passe de résolution d'ambiguïté, sélectionnez la case à cocher Appliquer à toute ligne de base dépassant.

Lorsque la case à cocher est sélectionnée, le processeur GPS applique un modèle ionosphérique pour corriger le biais ionosphérique. La méthode de correction ionosphérique est sélectionnée automatiquement basée sur si des données à monofréquence ou bi-fréquence existent dans la base de données du projet. L'une de ces actions est effectuée lorsque la case à cocher est sélectionnée:

  Si toutes les données du projet étaient collectées utilisant des récepteurs à bi-fréquence, le processeur GPS essaie de produire un observable ionosphérique-libre en appliquant les corrections de modèle ionosphérique aux lignes de base dépassant la distance spécifiée dans le champ Appliquer à toute ligne de base dépassant. Les corrections ionosphériques commencent dans la solution de code et l'action de modelage s'améliore peu à peu pour chaque solution successive.

  Si au moins un fichier de données a été collecté utilisant un récepteur à monofréquence, le processeur GPS utilise les données ionosphériques comprises dans l'éphéméride diffusée pour supprimer 50% de l'erreur ionosphérique.

4.	Dans le champs Appliquer à toute ligne de base dépassant, saisissez une valeur de distance, dans les unités du projet.

Les corrections de modèle ionosphérique pour la passe de résolution d'ambiguïté sont activées par défaut pour les lignes de base dépassant 10 kilomètres.


Filtrer les éléments Timeline

 Vue d'ensemble et plus amples informations

Les commandes sont disponibles sur la barre d'outils Timeline et dans les menus pour le filtrage des éléments graphiques qui s'affichent dans l'Afficheur de période de temps.

Filtrage des icônes d'éphéméride

Sélectionnez la commande Ephéméride pour filtrer les icônes d'Ephéméride affichées dans l'Afficheur de période de temps. Cette commande affiche ou masque les icônes d'Ephéméride chaque fois qu'elle est utilisée.

Pour filtrer les icônes d'Ephéméride, effectuez l'une des choses suivantes:

  Cliquez avec la bouton droit de la souris dans l'arrière plan de l'Afficheur de période de temps, et sélectionnez Afficher filtres / Ephéméride.

  Dans la barre d'outils Timeline, cliquez sur [image].

Filtrage des segments d'occupation cinématique continu

Sélectionnez la commande Continu pour filtrer les icônes des éléments de Segment continu affichés dans l'Afficheur de période de temps. Cette commande affiche ou masque les icônes des éléments de Segment continu chaque fois qu'elle est utilisée.

Pour filtrer les segments d'occupation, effectuez l'une des choses suivantes:

  Cliquez avec la bouton droit de la souris dans l'arrière plan de l'Afficheur de période de temps, et sélectionnez Afficher filtres / Continu.

  Dans la barre d'outils Timeline, cliquez sur [image].

Filtrage des satellites et des observations GPS associées

La commande Satellites peut être utilisée pour filtrer les Satellites et les éléments d'observation GPS affichés dans l'Afficheur de période de temps. Cette commande affiche ou masque les  icônes de Satellite et les éléments d'observation GPS chaque fois qu'elle est utilisée.

Pour filtrer les Satellites, effectuez l'une des choses suivantes:

  Cliquez avec la bouton droit de la souris dans l'arrière plan de l'Afficheur de période de temps, et sélectionnez Afficher filtres / Satellites.

  Dans la barre d'outils Timeline, cliquez sur [image].

Filtrage des icônes d'événement

Sélectionnez la commande Evénements pour filtrer les Evénements affichés dans l'Afficheur de période de temps. Cette commande affiche ou masque les icônes d'Evénement chaque fois qu'elle est utilisée. Les données d'événement doivent exister dans le projet avant que ce bouton devient active.

Pour filtrer les événements:

  Dans la barre d'outils Timeline, cliquez sur [image].


Déplacer les colonnes dans la liste de Traitement GPS

 Vue d'ensemble et plus amples informations

Les colonnes dans la liste de Traitement GPS peuvent être déplacées à des nouveaux emplacements dans la liste. Les déplacements de colonne sont temporaires et ils retournent à leurs emplacements d'origine lors du commencement de la session de traitement GPS suivante.

Pour déplacer les colonnes:

1.	Déplacez le curseur sur l'en-tête de la colonne.

L'en-tête contient le titre de la colonne et se trouve au-dessus de la première ligne de données.

2.	Effectuez l'une des actions suivantes:

  Pour déplacer la colonne à droite, faites glisser déplacer l'en-tête à droite jusqu'à ce que son côté gauche passe au-delà de la position dans laquelle vous voulez insérer la colonne, puis relâchez le bouton de la souris.

  Pour déplacer la colonne à gauche, faites glisser déplacer l'en-tête à gauche jusqu'à ce que son côté droit passe au-delà de la position dans laquelle vous voulez insérer la colonne, puis relâchez le bouton de la souris.


Naviguer à travers de Timeline utilisant l'Afficheur de période de temps

Utilisez ces actions pour déplacer la ligne de temps à travers de l'Afficheur de période de temps:

  Utilisez les barres de défilement pour déplacer la ligne de temps à droite ou à gauche.

  Ajustez les champs Heure de début et Heure de fin pour vous déplacer à une période de temps spécifique.

  Utilisez la commande Etendue de zoom pour afficher la ligne de temps entière.

  Utilisez la commande Zoom à l'étendue pour effectuer un zoom sur l'élément sélectionné à la largeur de l'Afficheur de période de temps.

  Utilisez la commande Suivant pour vous déplacer au point de fin de l'occupation suivante.

  Utilisez la commande Précédent pour vous déplacer au point de début de l'occupation précédente.

Utilisez les actions suivantes pour afficher les données verticalement:

  Faites glisser déplacer le bord supérieur de la zone d'affichage Timeline vers le haut ou vers le bas pour afficher plus ou moins informations.

  Ouvrez et fermez les dossiers de données dans la barre de contrôle pour afficher plus informations.

  Utilisez les barres de défilement verticales pour monter et descendre à travers les données.

Considérez ces lignes directrices:

  Vous pouvez double-cliquer sur la plupart des éléments Timeline pour afficher les propriétés de données qu'ils représentent.

  Vous pouvez cliquer avec le bouton droit de la souris sur la plupart des éléments Timeline et les arrière-plans de fenêtre pour voir un menu de commandes. Chaque menu comprend des commandes applicables à la fenêtre ou l'élément sélectionné.

  Les affichages spéciaux de Timeline ne sont disponibles que lors de la sélection de certains éléments. Le menu Report SV ne s'affiche comme une commande de menu ou une bouton actif de la barre d'outils que lorsqu'une icône de satellite est sélectionnée. De la même façon, les commandes Report DOP et Plan du ciel ne sont disponibles dans les menus et les boutons de la barre d'outils que lorsqu'une occupation, un levé ou une icône d'éphéméride est sélectionné.

Pour plus amples informations, référez-vous à ces rubriques:

  Affichage de l'occupation précédente ou suivante

  Dossiers de données Timeline

  Menus Timeline

  Barres d'outils Timeline

  Affichages supplémentaires Timeline

  Dialogues de Propriétés Timeline

  Commandes Timeline


Tracer les informations de poursuite de satellite brutes

 Vue d'ensemble et plus amples informations

Les informations de poursuite de satellite brutes sont tracées dans le Report SV en sélectionnant des boutons dans le barre de dialogue ou des options pour le menu Affichage / Données. En sus du traçage des données, les reports peuvent être imprimés et les informations collectées du satellite peuvent être exportées dans un fichier pour documenter le report.

Pour tracer les données de poursuite de satellite:

1.	Pour afficher Timeline, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

La Zone d'affichage Timeline s'affiche.

2.	Cliquez sur un dossier.

Les dossiers de données s'affichent dans la barre de contrôle qui se trouve dans le coin inférieur à gauche de la Zone d'affichage Timeline et affichent un symbole [image] lorsqu'ils sont ouverts. Les fichiers de données affichent le modèle et le numéro de série du récepteur utilisé pour collecter les données. Lorsqu'ils sont ouverts, des icônes s'affichent pour tous les satellites poursuivis pendant la période de temps d'occupation.

NOTE: Au lieu d'ouvrir les dossiers individuels, la commande Agrandir tout peut être utilisée pour ouvrir tous les dossiers de données.

3.	Double-cliquez sur une icône de Satellite.

L'icône de Satellite est soulignée, et la fenêtre Report SV s'affiche.

4.	Pour tracer les données, effectuez l'une des choses suivantes:

  Cliquez sur le bouton requis dans la barre de dialogue.

  Sélectionnez les commandes de report requises du menu Affichage / Données.

Une fois que le report est affiché, vous pouvez effectuer les actions suivantes:

Pour afficher les mesures du report:

  Déplacez le curseur de la souris à travers le report à l'emplacement requis, et lisez les informations de mesure et d'heure dans la barre d'état. La valeur enregistrée à la position de la souris et l'heure à laquelle les données ont été collectées s'affichent dans la barre d'état.

Pour tracer un report différent dans la même fenêtre:

  Sélectionnez la commande de report requise de la barre de dialogue ou du sous-menu Affichage / Données.

Les données sélectionnées sont tracées dans la même fenêtre de report avec le premier report.

Pour imprimer le report:

1.	Effectuez l'une des choses suivantes:

  Sélectionnez  Fichier / Imprimer.

  Appuyer sur Ctrl+P.

  Dans la barre d'outils, cliquez sur [image].

Le dialogue Imprimer s'affiche.

2.	Sélectionnez les options requises.

3.	Cliquez sur OK.

Le report est imprimé.

Pour imprimer le report dans un fichier:

1.	Effectuez l'une des choses suivantes:

  Sélectionnez  Fichier / Imprimer.

  Appuyer sur Ctrl+P.

  Dans la barre d'outils, cliquez sur

Le dialogue Imprimer s'affiche.

2.	Sélectionnez l'option Imprimer dans un fichier.

3.	Cliquez sur OK.

Le report est imprimé dans un fichier. Beaucoup de programmes peuvent importer les données graphiques imprimées dans un fichier. Ce sert lors de l'inclusion des reports dans les rapports.

Pour imprimer les données tabulaires:

1.	Effectuez l'une des choses suivantes:

  Sélectionnez Fichier / Exporter.

  Appuyez sur Alt+FE.

Le dialogue Exporter fichier d'affiche.

2.	Sélectionnez le répertoire et le nom du fichier pour le stockage du fichier.

Les informations de poursuite de satellite utilisées pour générer le report sont écrites dans un fichier texte (*.txt) et stockées dans le répertoire sélectionné. Les données sont écrites dans le fichier dans un format tabulaire. Si des reports multiples sont affichés dans la même fenêtre de Report SV, une colonne de données tabulaires est comprise pour chaque type de report.

NOTE: Des fenêtres de report supplémentaires peuvent être ouvertes utilisant la commande Fichier / Nouveau report. Chaque fenêtre peut afficher des groupes de reports séparés. Vous pouvez minimiser et agrandir les fenêtres et effectuer d'autres actions communes pour contrôler les fenêtres affichées dans Report SV.

•


Imprimer la zone d'affichage Timeline

 Vue d'ensemble et plus amples informations

Le contenu de la zone d'affichage Timeline peut être imprimé en mode portrait ou paysage.

NOTE: Avant l'impression, ajustez la taille de la zone d'affichage. Seules les données qui s'affichent actuellement dans la zone d'affichage sont imprimées.

Pour imprimer la zone d'affichage Timeline:

1.	Pour afficher Timeline effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

2.	Cliquez sur l'arrière-plan de la barre de contrôle, l'Afficheur de période de temps ou la Règle de temps.

3.	Pour afficher le dialogue Imprimer, effectuez l'une des choses suivantes:

  Sélectionnez Fichier / Report/Imprimer.

  Appuyez sur Ctrl+P.

Le dialogue Imprimer s'affiche.

4.	Pour imprimer la zone d'affichage, effectuez l'une des choses suivantes:

  Pour imprimer la zone d'affichage en mode Portrait, cliquez sur OK.

  Pour imprimer la zone d'affichage en mode Paysage, cliquez sur Propriétés, cliquez sur Paysage et cliquez sur OK  deux fois.

La zone d'affichage Timeline est mise à l'échelle automatiquement afin de s'adapter à la largeur ou la longueur du papier et est imprimée.


Traiter les lignes de base

 Vue d'ensemble et plus amples informations

Les lignes de base individuelles ou les groupes de lignes de base peuvent être sélectionnés pour le traitement.

Pour traiter toutes les lignes de base:

1.	Ouvrez un projet contenant des fichiers de données GPS brutes.

2.	Cliquez sur l'arrière-plan de la fenêtre de graphiques.

Vous devez cliquer dans une zone où il n'y a aucunes données tracées. Cette action désélectionne tous les éléments sélectionnés. Lorsqu'aucune ligne de base n'est sélectionnée dans la fenêtre de graphiques, le processeur de lignes de base automatiquement sélectionne toutes les lignes de base potentielles pour le traitement.

3.	Pour traiter les lignes de base, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Dans le groupe de levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Dans le groupe de traitement dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

NOTE: Il est possible d'annuler la session de traitement GPS à tout moment en appuyant sur Annuler.

Les informations d'état s'affichent dans la barre d'état lors de la continuation de la session de traitement GPS. Les statistiques suivantes s'affichent:

  L'indicateur de progression à gauche de la barre d'état surveille la progression de chaque solution de traitement de ligne de base.

  Le deuxième indicateur affiche les messages générés par le processeur. Les points de début et les points de fin des lignes de base individuelles sont affichés pendant la continuation de la session.

  Le nombre de fichiers à traiter et le nombre de lignes de base restantes à traiter s'affichent dans le troisième indicateur droit de la barre d'état. Cet indicateur indique En suspens après toutes les lignes de base sont traitées et avant de cliquer sur Enregistrer  pour stocker les solutions dans le projet.

  L'indicateur d'état complètement à droite donne un résumé du nombre de solutions de lignes de base acceptées et rejetées.

Pendant la continuation de la session de traitement GPS, les résultats du traitement de chacune des lignes de base sélectionnées s'affichent sous forme de résumé dans la liste de Traitement GPS. Les solutions de lignes de base acceptées sont identifiées par une coche dans la colonne gauche de la liste de Traitement GPS.

Les lignes de base individuelles avec des solutions sont marquées avec des indicateurs rouges dans la fenêtre de graphiques.

Pour traiter une sélection de lignes de base:

1.	Dans la fenêtre de graphiques, sélectionnez la (les) ligne(s) de base que vous voulez traiter utilisant l'une des techniques suivantes:

  Faites glisser déplacer un rectangle de sélection autour d'un groupe de lignes de base.

  Maintenez enfoncée la touche Ctrl lorsque vous cliquez sur des lignes de base multiples.

ASTUCE: Vous pouvez désélectionner une ligne de base en maintenant enfoncée la touche Ctrl et en cliquant sur la ligne de base une deuxième fois.

2.	Pour traiter les lignes de base, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Dans le groupe de levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Dans le groupe de traitement dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le traitement commence.

Une fois que les lignes de base sont traitées, vous pouvez afficher le rapport de Traitement de lignes de base GPS et analyser les résultats de solutions de lignes de base individuelles. Pour plus amples informations, référez-vous à Analyse des rapports de Traitement de lignes de base GPS.

Après la revue des données du rapport des solutions individuelles, vous pouvez enregistrer les solutions de lignes de base.

NOTE: Après le traitement de lignes de base et la fermeture du dialogue Traitement GPS, vous pouvez double-cliquer sur un Indicateur d'avertissement dans la barre d'état Vue de levé. Cette action de double-cliquer ouvre la fenêtre de Propriétés avec la sélection des lignes de base ayant des indicateurs d'avertissement associés. Vous pouvez ouvrir les dossiers de Lignes de base dans la liste de Sélection pour identifier pourquoi ces lignes de base ont été marquées. La page d'Avertissement identifiera si la ligne de base a échoué les critères d'acceptance de Ratio, RMS ou Référence de variance et d'autres raisons de marquer la ligne de base tel qu'un échec de fermeture de boucle. La compréhension de pourquoi les lignes de base sont marquées peut servir à éviter que le problème se produit à nouveau. Pour plus amples informations, référez-vous à Analyse des rapports de Traitement de lignes de base GPS.

Il y a beaucoup de considérations pour le traitement GPS. Pour plus amples informations concernant le traitement de lignes de base GPS, référez-vous au rubriques suivantes:

  Détermination des lignes de base potentielles

  Sélection des lignes de base à traiter

  Sélection d'un style de traitement GPS

  Démarrage du processeur de lignes de base

  Affichage des résultats de traitement

  Enregistrement des résultats de traitement

  Retraitement des lignes de base


Retraiter les lignes de base problématiques

 Vue d'ensemble et plus amples informations

Cette technique de résolution des problèmes dépend de la durée du temps de la session d'observation. Si la ligne de base en question possède assez de données, et un nombre suffisant de satellites visibles, il faut raccourcir le temps d'occupation au début ou à la fin de la session. Cette procédure est particulièrement utiles si les données au début ou à la fin d'une session sont bruyantes, ou remplies de dérapages de cycle.

Pour retraiter la ligne de base:

1.	Pour afficher Timeline, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

2.	Développez le dossier de données contenant les données de levé.

3.	Cliquez avec le bouton droit de la souris sur l'observation GPS.

4.	Sélectionnez Propriétés. Le dialogue Propriétés d'observation GPS s'affiche.

5.	Saisissez la nouvelle Heure de début ou Heure de fin.

6.	Cliquez sur OK.

7.	Cliquez sur la ligne de base problématique.

8.	Pour traiter la ligne de base, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Dans le groupe de levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Dans le groupe de traitement dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

La solution de lignes de base individuelle est recalculée et les résultats s'affichent dans le dialogue Traitement de lignes de base.


Sélectionner les occupations dans Timeline

 Vue d'ensemble et plus amples informations

La fenêtre de graphiques et Timeline sont interconnectés. Considérez ces lignes directrices lors de la sélection des éléments de la fenêtre de graphiques ou la Zone d'affichage Timeline:

  Si vous sélectionnez des occupations dans Timeline, le points sélectionnés sont également sélectionnés dans la fenêtre de graphiques.

  Si vous sélectionnez une ligne de base dans la fenêtre de graphiques,  Timeline sélectionne les deux occupations composant la ligne de base.

  Si vous sélectionnez un point dans la fenêtre de graphiques,  Timeline sélectionne toutes les occupations associées au point.

Un plan de codification en couleurs est utilisé pour identifier les divers types d'occupations et de segments de données qui s'affichent dans l'Afficheur de période de temps. Pour plus amples informations, référez-vous au Plan de codification en couleurs.

Pour sélectionner les occupations dans Timeline:

  Cliquez sur l'occupation.

L'occupation est soulignée pour indiquer qu'elle est sélectionnée.

Pour sélectionner les occupations en sélectionnant une ligne de base dans la fenêtre de graphiques:

  Cliquez sur la ligne de base dans la fenêtre de graphiques.

Les deux occupations associées à la ligne de base sont sélectionnées dans l'Afficheur de période de temps.

Pour sélectionner les occupations en sélectionnant un point dans la fenêtre de graphiques:

  Faites glisser déplacer un rectangle de sélection autour du point.

L'occupation associée au point est sélectionnée dans l'Afficheur de période de temps.

ASTUCE: Les observations et les points peuvent également être sélectionnés dans la fenêtre de Propriétés et vice versa. Vous pouvez également laisser la fenêtre de Propriété ouverte lorsque vous travaillez dans la fenêtre de graphiques ou Timeline pour afficher les propriétés des entités sélectionnées.


Configurer le rapport de Traitement de lignes de base GPS

Les sections du rapport de Traitement de lignes de base GPS peut être activé ou désactivé pour contrôler le contenu du rapport.

Pour configurer le rapport:

1.	Pour afficher le dialogue Configuration du rapport de traitement de lignes de base GPS, effectuez l'une des choses suivantes:

  Sélectionnez Rapport / Configurer / Rapport de traitement de lignes de base GPS.

  Appuyer sur Alt+RSO.

Le dialogue Configuration du rapport de traitement de lignes de base GPS s'affiche.

2.	Sélectionnez ou effacez les cases à cocher pour contrôler les sections comprises dans le Rapport de traitement de lignes de base GPS.


Commencer le traitement GPS

 Vue d'ensemble et plus amples informations

Pour commencer le traitement GPS:

1.	Dans la Vue de levé, sélectionnez les lignes de base requises. Lorsqu'aucune n'est sélectionnée, toutes les lignes de base potentielles sont traitées.

2.	Effectuez l'une des choses suivantes:

  	Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  	Dans le groupe de levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

Dans le groupe de traitement dans la barre du projet, sélectionnez Traiter lignes de base GPS.

Appuyez sur F9.

Le dialogue Traitement GPS ouvre et le traitement commence.

NOTE: Il est possible d'annuler la session de traitement GPS à tout moment en appuyant sur Annuler.

Les informations d'état s'affichent dans la barre d'état lors de la continuation de la session de traitement GPS. Les statistiques suivantes s'affichent:

  L'indicateur de progression à gauche de la barre d'état surveille la progression de chaque solution de traitement de ligne de base.

  Le deuxième indicateur affiche les messages générés par le processeur. Les points de début et les points de fin des lignes de base individuelles sont affichés pendant la continuation de la session.

  Le nombre de fichiers à traiter et le nombre de lignes de base restantes à traiter s'affichent dans le troisième indicateur droit de la barre d'état. Cet indicateur indique En suspens après toutes les lignes de base sont traitées et avant de cliquer sur Enregistrer  pour stocker les solutions dans le projet.

  L'indicateur d'état complètement à droite donne un résumé du nombre de solutions de lignes de base acceptées et rejetées. Les critères d'acceptance sont configurés dans le dialogue Styles de traitement GPS.

Pendant la continuation de la session de traitement GPS, les résultats du traitement de chacune des lignes de base sélectionnées s'affichent sous forme de résumé dans la liste de Traitement GPS. Les solutions de lignes de base acceptées sont identifiées par une coche dans la colonne gauche de la liste de Traitement GPS.  Aucune coche ne s'affiche lorsqu'une ligne de base échoue aux critères de test d'acceptance de qualité.

Les lignes de base marquées sont admises et leurs solutions sont enregistrées. Etudiez celles-ci lorsque la session de traitement GPS finit pour déterminer pourquoi elles ne sont pas réussies aux critères d'acceptance de qualité. Les lignes de base sont marquées avec des indicateurs rouges dans la fenêtre de graphiques.

Pour rejeter les lignes de base individuelles avant d'enregistrer la session de traitement.

1.	Sélectionnez la solution de lignes de base requise de la liste de Traitement GPS.

2.	Effacez la case à cocher dans la colonne gauche.

Pour afficher le rapport de Traitement de lignes de base pour les solutions de lignes de base individuelles:

1.	Sélectionnez la solution de lignes de base requise de la liste de Traitement GPS.

2.	Cliquez sur Rapport. Le Rapport de traitement de lignes de base GPS s'affiche.

Pour plus amples informations, référez-vous au Rapport de traitement de lignes de base GPS.

3.	Si nécessaire, répétez ces étapes pour afficher des rapports supplémentaires.

ASTUCE: Pour pouvez afficher un rapport de Traitement de lignes de base GPS pour une ligne de base après le traitement GPS. Dans la fenêtre de graphiques, sélectionnez la (les) ligne(s) de base requise(s) et puis sélectionnez Rapport / Rapport de traitement de lignes de base GPS.

Toutes les solutions de lignes de base acceptées peuvent être enregistrées dans le projet.

La case à cocher Ecraser les solutions de lignes de base en double contrôle comment les lignes de base sont enregistrées après le retraitement. La case à cocher est sélectionnée par défaut, qui signifie que les solutions existantes sont écrasées. Si la case à cocher est effacée, la nouvelle solution est ajoutée au projet et la solution précédente est conservée. Lorsque ce se produit, la nouvelle solution devient la solution active et la solution précédente devient inactive. La fenêtre Propriétés peut être utilisée pour changer une solution précédente à la solution active à nouveau.

La case à cocher Ecraser les solutions de lignes de base en double ne s'applique qu'aux lignes de base qui sont traitées plus qu'une fois. Il n'a aucun effet sur les lignes de base entre les mêmes deux points qui sont calculés à partir des données GPS collectées à une heure différente ou sur un jour différent. Il est recommandé de toujours écraser les solutions de lignes de base en double.

Pour enregistrer les solutions de lignes de base:

  Cliquez sur Enregistrer.

Les solutions de lignes de base acceptées sont enregistrées dans le projet.

Pour annuler une session de traitement GPS:

  Cliquez sur Annuler.

Il y a beaucoup de considérations pour le traitement des données GPS. Pour plus amples informations concernant le traitement de lignes de base, référez-vous aux rubriques suivantes:

  Détermination des lignes de base potentielles

  Sélection des lignes de base à traiter

  Sélection d'une style de traitement GPS

  Démarrage du processeur de lignes de base

  Affichage des résultats du traitement

  Enregistrement des résultats du traitement

  Retraitement de lignes de base


Résolution des problèmes pour la configuration du masque d'élévation

 Vue d'ensemble et plus amples informations

Utilisez cette procédure de résolution des problèmes si les statistiques de lignes de base ne se sont pas améliorées après la désactivation des satellites sélectionnés ou des données d'observation GPS. L'élévation du masque d'élévation peut supprimer les données bruyantes et améliorer les statistiques de lignes de base. Utilisez une approche par tâtonnements pour élever l'angle du masque d'élévation. Essayez d'augmenter l'angle par des incréments d'un degré afin d'éviter la perte des bonnes données.

Pour évaluer l'élévation:

1.	Pour afficher Timeline, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

Timeline s'affiche.

2.	Cliquez sur le symbole [image] du dossier de données requis pour voir des satellites individuels associés au calcul de la ligne de base problématique.

3.	Cliquez avec le bouton droit de la souris sur une icône de Satellite.

4.	Sélectionnez Report SV.

5.	Cliquez sur Elévation pour afficher le changement dans l'élévation du satellite.

6.	Répétez pour tous les satellite associés à la ligne de base pour déterminer si l'élévation du masque d'élévation a amélioré les résultats du traitement.

Pour élever l'élévation:

1.	Pour afficher le dialogue Styles de traitement GPS, sélectionnez Levé / Styles de traitement GPS. 	Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez le style de la liste.

3.	Cliquez sur Edition. Le dialogue Editer style s'affiche.

4.	Dans le champ Masque d'élévation, saisissez le nouvel angle d'élévation de masque.

5.	Cliquez sur OK une ou plusieurs fois jusqu'à ce que les dialogues se ferment.

6.	Cliquez sur la ligne de base.

7.	Pour traiter la ligne de base, effectuez l'une des choses suivantes:

   Sélectionnez Levé / Traiter lignes de base GPS

   Appuyez sur F9.

La ligne de base individuelle est retraitée.

8.	Vérifiez les résultats.

Vérifiez si cette procédure de résolution des problèmes a améliorée les statistiques de lignes de base.


Utiliser les données météorologiques observées pour le traitement GPS

La case à cocher Utiliser données de met observées  est utilisée pour spécifier que les données météorologiques observées devraient être utilisées lors du traitement des lignes de base pour des corrections troposphériques.

NOTE: Les étapes suivantes supposent que le dialogue Editer style avancé soit affiché.

Pour activer ou désactiver l'utilisation des données météorologiques:

1.	Sélectionnez la tabulation Tropo. Les paramètres du style Tropo s'affichent.

2.  Configurez la case à cocher Utiliser données de met observées pour sélectionner le type de données météorologiques appliqué lors du calcul des solutions de traitement GPS. Les données Met (Météorologiques) consistent en l'humidité relative, la pression barométrique et la température

  Lorsque cette case à cocher est sélectionnée, les données météorologiques observées qui se trouvent dans le fichier de données ou le fichier RINEX sont utilisées pour modeler le troposphère lors du calcul du délai de zénith troposphérique. Cette case à cocher est sélectionnée par défaut.

  Effacez cette case à cocher pour utiliser les valeurs météorologiques standard au lieu des données météorologiques enregistrées.

NOTE: Lors de l'enregistrement des données météorologiques sur le terrain, il est très important d'utiliser des instruments de haute qualité qui ont été calibrés pour assurer des lectures correctes. L'utilisation des données météorologiques obtenues avec des instruments de mauvaise qualité peut dégrader la solution de lignes de base.


Afficher les propriétés d'éphéméride dans Timeline

 Vue d'ensemble et plus amples informations

Les informations dérivées à partir des éphémérides diffusées collectées à partir des satellites individuels pendant les sessions de collecte de données sont disponibles dans Timeline. Le dossier de données applicable doit être ouvert avant d'afficher les informations.

Les informations d'éphéméride dans le dialogue sont dérivées à partir de l'éphéméride diffusée et ne peuvent pas être éditées. Les  messages dans les champs URA et Santé sont d'un intérêt particulier, car ils sont des indicateurs de la qualité des données transmises du satellite.

Pour afficher les propriétés d'éphéméride, effectuez l'une des choses suivantes:

  Double-cliquez sur l'icône d'Ephéméride.

  Dans la barre d'outils Timeline, cliquez sur [image].

Le dialogue Propriétés d'éphéméride de satellite s'affiche.


Afficher les propriété d'occupation dans Timeline

 Vue d'ensemble et plus amples informations

Les propriétés des Segments continus et les Occupations statiques peuvent être affichées dans le dialogue Occupation/Propriétés de segments de données. Les options du dialogue sont mises à jour automatiquement pour refléter le type d'occupation sélectionnée.

Pour afficher les Propriétés d'occupation:

1.	Double-cliquez sur l'élément d'Occupation requis. Le dialogue Occupation/Propriétés de segments de données s'affiche.

2.	Après l'affichage des propriétés, cliquez sur OK.

NOTE: Vous pouvez également éditer des propriétés sélectionnées, y compris le Type de segment, les Heure de début et de fin de l'occupation, et les propriétés d'antenne.


Afficher les propriété d'observation GPS dans Timeline

 Vue d'ensemble et plus amples informations

Le filtre Satellites est activé par défaut lorsque Timeline s'affiche. Vous pouvez désactiver le filtre pour masquer les Observations GPS.

Pour filtrer les observations GPS de la barre d'outils:

  Dans la barre d'outils Timeline, cliquez sur [image].

Les Observations GPS sont masquées si affichées ou affichées si masquées.

Pour filtrer les observations GPS de l'Afficheur de période de temps:

1.	Cliquez avec le bouton droit de la souris dans l'arrière-plan de l'Afficheur de période de temps .

2.	Sélectionnez Afficher filtres / Satellites.

Les observations GPS sont masquées si affichées ou affichées si masquées.


Afficher le segment de levé suivant ou précédent dans Timeline

 Vue d'ensemble et plus amples informations

Les commandes Suivant et Précédent, également représentées sous forme de boutons directionnels bleus sur la barre d'outils Timeline, sont utilisées pour déplacer l'Afficheur de période de temps au point de début ou de fin de l'occupation précédente ou suivante. Ces commandes sont très utiles lorsque la ligne de temps devient très longue, en rendant très difficile le déplacement efficace entre les occupations.

Pour utiliser les commandes Suivant ou Précédent:

1.	Sélectionnez l'élément d'Occupation dans l'Afficheur de période de temps.

2.	Pour sélectionner la commande Suivant ou Précédent, effectuez l'une des choses suivantes:

  Cliquez avec le bouton droit de la souris sur l'Occupation, et sélectionnez Suivant ou Précédent.

  Dans la barre d'outils Timeline, cliquez sur [image] ou [image].

Si Suivant est sélectionné, l'Afficheur de période de temps se déplace au point de fin de l'occupation suivante. Si Précédent est sélectionné, l'Afficheur de période de temps se déplace à l'occupation précédente.

NOTE: Le dialogue Occupation/Propriétés de segments de données comprend deux boutons de rotation. Le bouton de rotation gauche se comporte comme la commande Précédent et le bouton droit comme la commande Suivant. Ces boutons vous permettent de déplacer l'Afficheur de période de temps à l'occupation suivante ou précédente et d'afficher les propriétés de chaque occupation au même temps.

ASTUCE: Vous pouvez également utiliser la fenêtre de Propriétés pour déplacer l'Afficheur de période de temps en sélectionnant une observation ou un point associé à une occupation. La sélection d'une observation ou un point de la fenêtre de Propriétés automatiquement sélectionne l'élément de levé applicable et déplace l'Afficheur de période de temps à l'élément d'occupation associé. Si vous laissez la fenêtre de propriétés affichée pendant que vous travaillez dans Timeline, vous pouvez afficher les propriétés des observations et des points associés aux occupations.


Afficher les statistiques de lignes de base

 Vue d'ensemble et plus amples informations

Il est possible d'afficher les statistiques de lignes de base de diverses façons. Elles peuvent être affichées pendant et après la terminaison d'une session de traitement GPS.

Pour afficher les statistiques de lignes de base du dialogue Traitement GPS:

1.	Commencez le traitement GPS.

Le dialogue traitement de lignes de base s'affiche et la session de traitement commence. Lorsque le processeur continue, chaque solution s'affiche dans les listes de Traitement GPS. Pour plus amples informations, référez-vous à Traitement de lignes de base.

2.	Etudiez les colonnes de Ratio, Variance de référence et RMS pour chaque ligne de base.

Ces colonnes affichent les résultats des tests de Ratio, Variance de référence et RMS. Si les résultats rapportés se trouvent dans les critères de référence définis pour le style de traitement GPS, la solution de ligne de base est acceptée et une coche apparaît dans la première colonne de la liste. Il n'y a aucune coche dans la première colonne si tout test activé fournit des mauvais résultats.

NOTE: Les lignes de base marquées sont également acceptées dans le projet, mais un indicateur d'avertissement rouge s'affiche dans la fenêtre de graphiques. Il faut étudier les propriétés des lignes de base marquées pour déterminer pourquoi la ligne de base n'a pas réussi aux critères d'acceptance et il faut prendre des actions appropriées pour corriger tout défaut. Pour plus amples informations, référez-vous à la fenêtre Propriétés.

3.	Pour afficher le Rapport de traitement de lignes de base GPS de toute solution, sélectionnez une solution de la liste et cliquez sur Rapport. Le Rapport de traitement de lignes de base GPS s'affiche.

ASTUCE: Vous pouvez également double-cliquer sur la ligne de base pour afficher le rapport. Il n'est pas nécessaire d'attendre jusqu'à ce que la session de traitement GPS est terminée avant d'afficher le rapport. Le traitement continuera pendant que vous lisez les rapports des lignes de base individuelles.


Afficher le rapport de traitement de lignes de base GPS

 Vue d'ensemble et plus amples informations

Le Rapport de traitement de lignes de base GPS d'une ligne de base peut être affiché dès que la ligne de base est traitée et les résultats s'affichent dans la liste de Traitement GPS. Le processeur continuera de traiter les lignes de base pendant que vous revoyez le Rapport de traitement de lignes de base GPS.

Pour afficher le Rapport de traitement de lignes de base GPS.

1.	Pour afficher le Rapport de traitement de lignes de base GPS, effectuez l'une des choses suivants:

  Double-cliquez sur une solution de lignes de base dans le dialogue Traitement GPS.

  Sélectionnez une ligne de base, et cliquez sur Rapport.

Le Rapport de traitement de lignes de base s'affiche.

2.	Défilez à travers le rapport pour étudier les données.

Etudiez les détails de la solution de lignes de base qui ne sont pas disponibles dans le résumé à une ligne.

Vérifiez les informations de station dans la solution contre les informations dans vos notes de terrain. Il faut faire attention à:

  Les noms de station

  Les hauteurs, les types et les méthodes de mesure des antennes

  Les heures de début et d'arrêt

Vérifiez le Résumé de poursuite de phase de satellite à chaque station pour des écarts dans le signal L1 ou L2. Une ligne solide indique un signal propre. Un écart dans la ligne indique un dérapage de cycle ou une perte de signal de satellite. Les coches indiquent quand le récepteur a repris le signal de satellite après un dérapage de cycle.

Vérifier le Résumé de poursuite de phase de satellite combiné. Les ombres grises indiquent les mesures actuellement utilisées dans la solution de lignes de base.

Vérifiez les Reports résiduels de chaque satellite. Ceux-ci affichent le RMS de chaque satellite utilisé pour déterminer la solutions de lignes de base.


    Commande Traiter lignes de base GPS

Plus amples informations

Comment ...	Dialogue

Sélectionnez cette commande pour commencer une session de traitement GPS:

  Sélectionnez Levé / Traitement GPS. Le dialogue Traitement GPS s'affiche, et la session de traitement GPS commence.


    Commande Rapport de traitement de lignes de base GPS

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour afficher le rapport de Traitement de lignes de base GPS:

1.	Sélectionnez la(les) ligne(s) de base sur la(les)quelle(s) vous voulez faire un rapport.

2.	Sélectionnez Rapport / Rapport de traitement de lignes de base GPS. Le Rapport du traitement de lignes de base GPS s'affiche.

Ce rapport affiche les résultats de la session de traitement GPS précédente. Utilisez-le pour analyser les résultats pour les solutions de traitement de lignes de base.

NOTE: Le Rapport de traitement de lignes de base GPS est également accessible du dialogue Traitement GPS . Vous pouvez sélectionner des solutions de ligne de base individuelles de la liste Traitement GPS, et cliquer sur Rapport pour afficher le rapport de la ligne de base.


    Commande Timeline

Plus amples informations

 Voir aussi

Pour ouvrir la zone d'affichage Timeline, effectuez l'une des choses suivantes dans Vue de levé:

  Sélectionnez Affichage / Timeline.

  Dans la barre d'outils, sélectionnez [image].

La zone d'affichage Timeline apparaît en bas de la fenêtre de graphiques.

Timeline affiche des informations au sujet des mesures GPS d'un projet dans un format à base de temps graphique. Chaque pièce de données est représentée à sa position appropriée sur une ligne de temps. Timeline n'est disponible que dans Vue de levé.


    Dialogue Editer style - Vue d'ensemble

Plus amples informations

 Comment ...

Vue d'ensemble

Utilisez ce dialogue pour déterminer comment les données GPS sont traitées.

Pour ouvrir le dialogue Editer style:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

Cliquez sur Expert lorsque vous avez besoin d'accéder aux contrôles de style plus avancés pour le perfectionnement du fonctionnement du processeur de lignes de base GPS. Le dialogue Editer style avancé s'affiche.

Masque d'élévation

Editez ce champ pour configurer l'élévation minimum du satellite pour le traitement de lignes de base GPS. Ce paramètre annule le masque d'élévation utilisé pour la collecte de données d'observation sur le terrain.

Considérez ces lignes directrices:

  Lors du calcul des résultats du traitement de lignes de base, le logiciel Trimble Geomatics Office n'utilise que les satellites au-dessus de cette élévation. Vous devez saisir cette valeur sous forme de degrés. La valeur par défaut est 13 degrés.

  Vous pouvez configurer cette valeur plus haute ou plus basse que le masque d'élévation utilisé pour la collecte de données d'observation sur le terrain, mais en général elle est configurée sur une valeur plus haute. La configuration d'une valeur plus basse que celle utilisée sur le terrain n'a aucun effet sur le traitement.

  Ce paramètre sert lorsque plusieurs récepteurs sont utilisés pour la collecte de données d'observation et les masques d'élévation ne sont pas configurés sur les mêmes paramètres. Ce champ annule ces paramètres de masque d'élévation et utilise un masque d'élévation constant pour le traitement de lignes de base.

  L'augmentation du masque d'élévation supprime les satellites avec une élévation plus basse des résultats du traitement GPS. Ces signaux de satellite peuvent être influencés par le bruit résultant des obstructions éventuelles et des trajets plus longs à travers le troposphère.

  L'augmentation excessive du masque d'élévation peut influencer les résultats du traitement GPS en réduisant le nombre de satellites disponibles dans la constellation.

Ephéméride

De cette liste, sélectionnez le type d'éphéméride à utiliser pour le traitement de lignes de base:

  Diffuser − le paramètre par défaut pour la plupart de traitement. L'éphéméride diffusée est transmise périodiquement par chaque satellite GPS, en général chaque heure. L'éphéméride contient les paramètres d'orbite du satellite.

  Précis − améliore la précision de la ligne de base. Souvent une éphéméride précise peut vous aider d'obtenir des solutions d'ambiguïté fixes sur les lignes de base longues. Pour utiliser cette option, une ou plusieurs éphémérides précises doivent être importées dans le projet.

Pour utiliser les éphéméride précise pour le traitement de lignes de base, les fichiers d'éphéméride précise importées dans le projet doivent contenir au moins huit groupes de positions de SV avant et après l'intervalle de temps des données traitées. Etant donné que la plupart des fichiers d'éphéméride précise fournissent des positions de SV toutes les 15 minutes, ce signifie que vous devez avoir une couverture d'éphéméride précise pour deux heures avant et deux après le commencement de votre levé. Si vous effectuez un levé près de 0:00 UTC, il se peut que vous devez obtenir les fichiers d'éphéméride précise de deux jours afin d'assurer une couverture correcte.

Précédemment les fichiers d'éphéméride précise contenaient des informations de tous les satellites GPS pour une semaine entière. Maintenant cependant, les fichiers les plus communs disponibles ne contiennent que les informations d'un seul jour. Les fichiers d'éphéméride précise peuvent être obtenus sous le format SP3 et EF18.  Le logiciel Trimble Geomatics Office peut utiliser tous les deux formats.

Les fichiers d'éphéméride précise sont disponibles à partir de:

  National Geodetic Survey (NGS)

  Center for Orbit Determination in Europe (CODE)

  European Space Agency (ESA)

  Scripps Institute Observatory (SIO)

  Canadian Department of Energy, Mines, and Resources (EMR)

  NASA's Jet Propulsion Laboratory (JPL)

  U.S. Naval Observatory (USNO)

Type de solution

De cette liste, sélectionnez le type de solution pour la passe finale du processeur de lignes de base.

Le processeur de lignes de base progresse à travers une séquence de solutions en ordre pour chaque ligne de base basée sur les types d'observation disponibles et les paramètres du style de traitement actif. En général, le traitement commence avec une solution de Code, suivie d'une solution de phase porteuse à différence triple et plusieurs solutions de phase porteuse à double différence. La solution de passe finale est sélectionnée ici et représente la meilleure solution pouvant être obtenue avec ce groupe d'observations et de contrôles.

Les types de solution les plus communs sont les solutions L1 fixe pour des lignes de base courtes et les solutions Iono libre fixe pour la plupart des autres solutions. Si vous traitez les lignes de base très longues, il se peut que les solutions Iono libre flottant sont la meilleure solution possible.

Les options suivantes sont disponibles:

  Code − utilisez cette option pour effectuer une solution de code seul. Si vous sélectionnez cette option, le processeur GPS s'arrête à la passe de solution de code.

  Flottant − utilisez cette option pour générer une solution flottante sans résoudre des ambiguïtés de nombre entier fixe. Dans certains cas, la réduction de temps de traitement peut être avantageux. Par exemple, cette option peut servir lors du traitement des lignes de base très longues pour lesquelles une solution flottante peut être la seule solution réalisable. La sélection de Flottant comme le Type de solution évite une recherche très longue par le processeur GPS.

D'autres contrôles utilisés pour spécifier la génération des solutions flottantes de façon différente comprennent:

  Longueur maximum de ligne de base pour essayer une solution fixe

  Temps de recherche maximum nombre entier:

Ces contrôles se trouvent dans le dialogue Editer styles avancés .

  Fixe − utilisez cette option pour effectuer une solution de nombre entier fixe. C'est le défaut et aussi la solution préférée.

NOTE: Lors de la création d'un style de traitement GPS que spécifie un Type de solution final de Code seul, vous devriez aussi éditer le groupe de Critères d'acceptance dans la tabulation Qualité . En général, les solutions de Code seul sont indiquées basées sur les critères fournis dans le style de traitement par défaut de Trimble. Un style de traitement de Code seul avec les Critères d'acceptance appropriés assurera que les résultats de traitement des lignes de base sont évalués correctement.

Expert

Cliquez sur Expert pour afficher ou éditer les contrôles avancés dans le style de traitement GPS actif.


    Dialogue Editer style avancé - tabulation Statique

Plus amples informations

 Comment ...

Editez ces contrôles pour modifier les paramètres utilisés pour le traitement des lignes de base statique et statique rapide

Pour afficher la tabulation Statique du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Statique.

Temps minimum d'observation de ligne de base

Editez ce champ pour fixer la quantité de chevauchement requise entre deux occupations de station simultanées avant que la ligne de base résultante sera considérée pour le traitement.  Ce paramètre contrôle l'ajout des lignes de base potentielles à un projet.

Par défaut le processeur de lignes de base requiert 120 secondes de données simultanées afin de traiter une ligne de base entre des récepteurs. Ainsi, tout chevauchement accidentel entre des mobiles multiples est supprimé.

Longueur maximum de ligne de base pour essayer une solution fixe

Editez les champs dans ce groupe pour spécifier la longueur maximum d'une ligne de base pour laquelle le processeur de lignes de base essayera de produire une solution fixe. Les lignes de base qui sont plus longues que les valeurs spécifiées ici recevront des solutions flottantes.

Les champs suivants sont disponibles:

  Utilisant éphéméride diffusée − éditez ce champ pour configurer la longueur maximum de ligne de base considérée lors du calcul des solutions de traitement GPS fixes utilisant une éphéméride diffusée. Le processeur de lignes de base ne calcule pas une solution fixe si la longueur maximum de ligne de base dépasse cette valeur. La valeur par défaut 200 kilomètres.

  Utilisant l'éphéméride précise − éditez ce champ pour configurer la longueur maximum de ligne de base considérée lors du calcul des solutions de traitement GPS fixes utilisant une éphéméride précise. Le processeur de lignes de base ne calcule pas une solution fixe si la longueur maximum de ligne de base dépasse cette valeur. La valeur par défaut est 2000 kilomètres.


    Dialogue Editer style avancé - tabulation Cinématique

Plus amples informations

Comment ...	Voir aussi
Editez ces contrôles pour modifier les paramètres utilisés pour le traitement des lignes de base cinématique.

Pour afficher la tabulation Cinématique du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Cinématique.

Temps d'observation de référence minimum

Editez ce champ pour définir le temps d'observation minimum requis pour une occupation à considérer comme une station de référence cinématique par rapport aux autres occupation dans la session de traitement.

Considérez ces lignes directrices:

  La valeur dans ce champ est destinée à empêcher le processeur GPS de traiter les chevauchements des observations communes importées dans le projet à partir de plusieurs fichiers de données. Ces observations sont collectées par deux ou plusieurs mobiles qui ont occupé deux points simultanément. Si le mobile reste immobile à un point pour une intervalle de temps plus long que ce temps minimum, le mobile est considéré comme un point de référence et les données d'observation communes collectées par d'autres mobiles sont traitées relatives à ce point.

  Considérez un Levé cinématique avec un seul récepteur de base et deux récepteurs mobiles. Sans ce temps d'observation de référence minimum, le processeur GPS essayerait de traiter non seulement les données entre les mobiles et la base, mais aussi  les données entre les deux mobiles.

  La valeur par défaut est 600 secondes. Ce temps d'observation de référence minimum indique au processeur GPS que seules les occupations qui dépassent 600 secondes, ou 10 minutes, sont considérées comme des points de référence.

  Configurez ce champ sur zéro pour traiter des lignes de base entre les récepteurs mobile.

Temps minimum d'observation d'initialisation statique

Editez ce champ pour modifier le temps d'observation minimum requis pour une ligne de base afin d'être utilisée comme une initialisation statique pour un segment de traitement cinématique spécifique.

Considérez ces lignes directrices:

  La configuration par défaut requiert qu'une ligne de base soit occupée pour au moins 120 secondes, ou 2 minutes, avant qu'elle est utilisée pour tout usage d'initialisation ultérieure.

  Les lignes de base qui dépassent cette valeur sont traitées comme les lignes de base statiques et sont enregistrées dans le projet pour une initialisation statique.

Ratio d'initialisation minimum de point connu

Editez ce champ pour modifier le ratio minimum acceptable utilisé pour une initialisation de point connu lors du traitement GPS cinématique.

L'initialisation de point connu commence par un inverse entre deux points connus. Les informations dérivées de cet inverse sont traitées comme si elles étaient une ligne de base fixe. Puis, le processeur de lignes de base maintient la ligne de base dérivée de l'inverse fixe, et n'effectue les solutions que pour les ambiguïtés de satellite. Cette étape comprend une recherche de nombre entier, similaire à celle effectuée dans une solution statique ou statique rapide.

Le ratio utilisé pour évaluer le succès de la recherche est le même que le ratio d'une solution de nombre entier fixe normal. Si le ratio de la recherche est supérieur au Ratio d'initialisation minimum de point connu, le processeur GPS accepte les résultats et les utilise pour l'initialisation de traitement cinématique subséquent.

Le Ratio d'initialisation minimum de point connu par défaut est 3.0. Cette valeur est plus haute que la valeur de seuil normale de 1.5 des solutions statique et statique rapide . Elle est plus haute parce que le processeur n'effectue les solutions que pour des ambiguïtés de satellite, et étant donné qu'il y a moins de variables impliquées, il est attendu que le ratio soit plus haut.

Temps de traitement minimum OTF (en vol)

Editez ce champ pour modifier la durée de temps minimum requise pour le processeur GPS d'essayer de résoudre les ambiguïtés de nombre entier en vol.

Considérez ces lignes directrices:

  Le récepteur doit s'exécuter continûment pour 200 secondes et maintenir un captage d'au moins quatre satellites afin de traiter l'initialisation (OTF) en vol. La valeur par défaut est 200 secondes avec cinq satellites visibles.

  Dans l'absence des informations d'initialisation statique, le processeur GPS essaie de résoudre les ambiguïtés de nombre entier utilisant toute partie des données avec au moins quatre satellites dans la constellation, chacune avec des époques d'une durée d'au moins 200 secondes. Etant donné que la constellation de satellites change continûment, les données de la meilleure combinaison de quatre satellites sont traitées, et pas nécessairement les mêmes quatre satellites pour l'occupation entière.

  Le processeur GPS utilise la technique d'initialisation OTF si toute ambiguïté reste après la réalisation de toutes les initialisations de lignes de base fixes et statiques. Le processeur GPS n'utilise pas l'initialisation OTF sur des segments de traitement cinématique inférieurs à cet intervalle de temps. Ces segments doivent être initialisés avec les techniques d'initialisation de lignes de base fixe ou statique.


    Dialogue Editer style avancé - tabulation Qualité

Plus amples informations

Comment ...	Voir aussi
Editez ces contrôles pour modifier l'identification et la suppression par édition des données et des solutions marginales lors du traitement, et avant d'enregistrer les résultats du traitement au projet. Les contrôles sur cette page sont utilisés pour identifier quelles solutions de lignes de base sont admises, marquées ou échouées..

Pour afficher la tabulation Qualité du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Qualité.

Critères d'acceptance

Editez les champs dans ce groupe pour modifier les critères d'acceptance utilisés pour assigner les solutions de traitement de lignes de base un état de Réussi, Marquer ou Echec. Ces critères également déterminent quelles solutions de lignes de base, par défaut, devraient être enregistrées dans le projet après le traitement

Considérez ces lignes directrices:

  Les champs Marquer et Echec sont disponibles pour RMS, Ratio et Variance de référence. Pour plus amples informations concernant ces tests, référez-vous aux rubriques suivantes::

  La case à cocher Si RMS

  La case à cocher Si Ratio

  La case à cocher Si variance de référence

  Des critères séparés peuvent être spécifiés pour les solutions de lignes de base de monofréquence et bi-fréquence. L'utilisation des critères d'acceptance de monofréquence ou bi-fréquence est déterminer par une combinaison du type de mesures GPS disponibles, le Type de solution sélectionné et le Style de traitement GPS actif, et la solution finale comme déterminée par le processeur de lignes de base même.

  Le test d'acceptance peut être basé sur toute combinaison de vérifications utilisant RMS, Ratio et Variance de référence. Le défaut est d'utiliser tous les trois paramètres de qualité pour déterminer l'état réussi/marquer/échec. Lorsque plus d'un des facteurs de qualité sont utilisés ensemble, l'état est basé sur la condition la plus mauvaise. Par exemple, si Ratio et Variance de référence sont admis, mais RMS échoue, la ligne de base reçoit un état d'échec. Le défaut est d'utiliser tous les trois tests.

NOTE: Il n'est pas nécessaire de modifier les critères d'acceptance pour la plupart des applications de levé. Cependant, l'exception est pour les solutions de passe finale de code seul. En général les solutions de code seul sont marquées basées sur les critères fournis dans le style de traitement par défaut de Trimble. Il est recommandé que vous configurez une style de traitement de code seul avec des critères d'acceptance appropriés si vous traitez les solutions de passe finale de code seul de façon routinière.

Editer multiplicateur

Editez ce champ pour modifier le multiplicateur utilisé pour calculer la valeur de seuil pour la suppression des hors des normes des itérations de processeur GPS successives.

Le processeur de lignes de base effectue la solution des lignes de base au moyen d'une série d'itérations successives. Dans chaque itération le processeur marque et supprime les valeurs hors des normes des données de la solution.  Ça se fait par le calcul d'une observation résiduelle pour la solution courante sur une base d'époque par époque. Chaque observation résiduelle est ensuite comparée à une valeur de seuil pour déterminer si l'observation est hors des normes ou non.

La valeur de seuil est le RMS total de tous les résidus d'observation multipliés par l'Editer multiplicateur. Si des valeurs hors des normes sont trouvées, elles sont marquées et supprimées de l'itération de processeur suivante. Un nouveau RMS total de tous les résidus d'observation est calculé pour chaque itération, et cette nouvelle valeur est utilisée comme la base pour la valeur de seuil utilisée pour marquer et supprimer des observations subséquentes.


    Case à cocher Si RMS

Plus amples informations

 Dialogue

Cette case à cocher contrôle l'utilisation de RMS dans la détermination de l'acceptance des solutions de traitement de lignes de base.

RMS est une mesure du bruit dans les mesures et les valeurs plus petites de RMS sont considérées meilleures. Les valeurs de RMS qui sont inférieures à la valeur marquée contribuent à un état de réussi. Les valeurs qui sont supérieures à la valeur marquée, mais qui sont inférieures à la valeur d'échec, contribuent à un état de marque. Les valeurs qui sont supérieures à la valeur d'échec causent l'échec de la ligne de base. Si cette case à cocher est effacée, le RMS n'est pas considéré lors de la détermination de l'acceptance.

Deux paires de champs sont inclues pour le test RMS; les champs Monofréquence Marquer et Echec et les champs Bi-fréquence, Marquer et Echec. Le processeur GPS utilise les valeurs dans seulement un groupe de ces champs lors de la réalisation du test d'acceptance RMS. Le groupe de champs est déterminé par le Type de solution sélectionné pour le style de traitement GPS.

L'acceptance peut être basée sur toute combinaison de vérifications utilisant RMS, ratio et la variance de référence. Le défaut est d'utiliser tous les trois paramètres de qualité pour déterminer l'état réussi/marquer/échec. Lorsque plus d'un des facteurs de qualité sont utilisés ensemble, l'état est basé sur la condition la plus mauvaise. Par exemple, si Ratio et Variance de référence sont admis, mais RMS échoue, la ligne de base reçoit un état d'échec.


    Case à cocher Si variance de référence

Plus amples informations

Dialogue	Voir aussi
Cette case à cocher contrôle l'utilisation de la Variance de référence dans la détermination d'acceptance des solutions de traitement de lignes de base.

La variance de référence est une mesure du degré de succès par le processeur de lignes de base dans l'estimation de l'erreur attendue. Idéalement la variance de référence devrait être 1.0. Les valeurs inférieures à 1.0 indiquent que moins d'erreurs que celles attendues ont été rencontrées. Le test d'acceptance basé sur la variance de référence ne recherche que le deuxième cas, dans lequel plus d'erreurs ont été rencontrées que celles attendues.

Les valeurs de variance de référence qui sont inférieures à la valeur de 'marquer' contribuent à un état de réussi. Les valeurs qui sont supérieures à la valeur de 'marquer' mais inférieures à la valeur d'échec, contribuent à un état marquer. Les valeurs qui sont supérieures à la valeur d'échec causent l'échec de la ligne de base. Si la case à cocher est effacée, la variance de référence n'est pas considérée lors de la détermination de l'acceptance.

Deux paires de champs sont inclues pour le test RMS; les champs Monofréquence Marquer et Echec et les champs Bi-fréquence Marquer et Echec. Le processeur GPS utilise les valeurs dans seulement un groupe de ces champs lors de la réalisation du test d'acceptance RMS. Le groupe de champs est déterminé par le Type de solution sélectionné pour le style de traitement GPS.

L'acceptance peut être basée sur toute combinaison de vérifications utilisant RMS, ratio et la variance de référence. Le défaut est d'utiliser tous les trois paramètres de qualité pour déterminer l'état réussi/marquer/échec. Lorsque plus d'un des facteurs de qualité sont utilisés ensemble, l'état est basé sur la condition la plus mauvaise. Par exemple, si Ratio et Variance de référence sont admis, mais RMS échoue, la ligne de base reçoit un état d'échec.


    Si Ratio

Plus amples informations

Dialogue	Voir aussi
Cette case à cocher contrôle l'utilisation de Ratio dans la détermination d'acceptance des solutions de traitement de lignes de base.

Le Ratio est une mesure du degré de succès par le processeur de déterminer les solutions de nombre entier fixe et les numéros plus hauts sont considérés meilleurs. Les valeurs de ratio qui sont supérieures à la valeur de 'marquer' contribuent à un état de réussi. Les valeurs qui sont inférieures à la valeur de 'marquer', mais supérieures à la valeur d'échec, contribuent à un état de marquer. Les valeurs qui sont inférieures à la valeur d'échec causent l'échec de la ligne de base. Si la case à cocher est effacée, le ratio n'est pas considéré lors de la détermination de l'acceptance. Le ratio est également ignoré si la solution finale pour le style de traitement est flottant ou code.

Deux paires de champs sont inclues pour le test RMS; les champs Monofréquence Marquer et Echec et les champs Bi-fréquence Marquer et Echec. Le processeur GPS utilise les valeurs dans seulement un groupe de ces champs lors de la réalisation du test d'acceptance RMS. Le groupe de champs est déterminé par le Type de solution sélectionné pour le style de traitement GPS.

L'acceptance peut être basée sur toute combinaison de vérifications utilisant RMS, ratio, et variance de référence. Le défaut est d'utiliser tous les trois paramètres de qualité pour déterminer l'état réussi/marquer/échec. Lorsque plus d'un des facteurs de qualité sont utilisés ensemble, l'état est basé sur la condition la plus mauvaise. Par exemple, si Ratio et Variance de référence sont admis, mais RMS échoue, la ligne de base reçoit un état d'échec.


    Dialogue Editer style avancé - tabulation Tropo

Plus amples informations

Comment ...	Voir aussi
Editez ces contrôles pour modifier la sélection et l'application des modèles troposphériques lors du traitement de lignes de base.

Pour afficher la tabulation Tropo du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Tropo.

Modèle

Sélectionnez de cette liste pour choisir un modèle de correction troposphérique. Le modèle compense pour les erreurs introduites lorsque les signaux passent à travers le troposphère. Le degré de correction varie par rapport à l'élévation du satellite.

Les options suivantes sont disponibles:

  Hopfield − le modèle Hopfield est le défaut

  Goad-Goodman

  Saastamoinen

  Black − le modèle Black n'est pas stable aux angles d'élévation-satellite bas et ne devrait pas être utilisé avec un masque d'élévation inférieur à 10 degrés

  Niell − le modèle Niell dépend de la latitude et la saison, et également il dépend de l'élévation du satellite.

  Aucun − sélectionnez cette option si vous ne voulez pas utiliser un modèle troposphériqiue.

Pour plus amples informations concernant les modèles pour la correction des signaux GPS passant à travers le troposphère, référez vous à la bibliographie.

Intervalle de retard de zénith estimé

Editez ce champ pour définir un intervalle de retard de zénith estimé constant, sous forme des heures.

Considérez ces lignes directrices:

  Le nombre d'heures doit être saisi comme une valeur de nombre entier. L'intervalle minimum d'estimation recommandé est une heure. La valeur par défaut est deux heures. Une valeur de zéro (0) ne produit aucune estimation de retard de zénith. Ce champ n'est pas disponible lorsque le modèle troposphérique est configuré sur Aucun.

  Etant donné que le troposphère n'est pas aussi dynamique que l'ionosphère, le retard du signal pendant deux heures est lent. Lors du traitement des lignes de base longues, si un front de tempête passe au-dessus d'un récepteur et pas de l'autre, il faut raccourcir l'intervalle d'estimation. L'intervalle par défaut est deux heures.

  Pour les lignes de base très longues, c'est à dire plus de 50 kilomètres, des erreurs dans l'éphéméride diffusée peuvent produire une estimation des paramètres troposphériques inexacte. Dans ce cas, utilisez une éphéméride précise.

  Pour les lignes de base inférieures à environ 10 kilomètres, avec des fichiers de données plus courts que 2 heures de durée, il se peut qu'il n'y a aucun avantage à l'estimation des retards de zénith. Avec l'augmentation de la longueur de ligne de base et les périodes d'observation, les effets du troposphère peuvent devenir plus importants.

Utiliser données de met observées

Sélectionnez cette case à cocher pour spécifier que les données météorologiques collectées sur le terrain devraient être utilisées lors du calcul des solutions de traitement GPS. Les données météorologiques consistent en la température, la pression et l'humidité relative.

Considérez ces lignes directrices:

  lorsque cette case à cocher est sélectionnée, les données météorologiques observées dans les fichiers de données GPS (.dat), ou importées avec un fichier RINEX , sont utilisées pour modeler le troposphère lors du calcul du retard de zénith troposphérique. Cette case à cocher est sélectionnée par défaut.

  Effacez cette option pour utiliser des valeurs météorologiques standard au lieu des données météorologiques enregistrées.

NOTE: Lors de l'enregistrement des données météorologiques sur le terrain, il est très important d'utiliser des instruments de haute qualité qui ont été calibrés afin d'assurer des lectures correctes. L'utilisation des données météorologiques obtenues avec des instruments de mauvaise qualité ou non-calibrés peuvent dégrader la solution de ligne de base .


    Dialogue Editer style avancé - tabulation Iono

Plus amples informations

Comment ...	Voir aussi
Editez ces contrôles pour modifier l'application du modelage ionosphérique lors du traitement des lignes de base.

Pour afficher la tabulation Iono du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Iono.

Passe de résolution d'ambiguïté

Sélectionnez la case à cocher dans ce groupe pour activer le modelage ionosphérique pour la passe de résolution d'ambiguïté. La valeur saisie dans le champ Appliquer à toute ligne de base dépassant détermine la longueur minimum de ligne de base pour la réception des corrections ionosphériques.

La correction par défaut est Iono libre pour des lignes de base dépassant 10 kilomètres observées à l'aide des récepteurs à bi-fréquence. Le modèle ionosphérique diffusé est utilisé pour  des lignes de base observées à l'aide des récepteurs à monofréquence. Cette option contrôle l'utilisation des corrections ionosphériques seulement pendant la résolution d'ambiguïté. Un contrôle séparé est disponible pour la correction ionosphérique de passe finale.

Passe finale

Sélectionnez la case à cocher dans ce groupe pour activer le modelage ionosphérique pour la passe finale. La valeur saisie dans le champ Appliquer à toute ligne de base dépassant détermine la longueur minimum de ligne de base pour la réception des corrections ionosphériques.

La correction par défaut est Iono libre pour les lignes de base dépassant 5 kilomètres observées à l'aide des récepteurs à bi-fréquence. Le modèle ionosphérique diffusé est utilisé pour  des lignes de base observées à l'aide des récepteurs à monofréquence. Cette option contrôle l'utilisation des corrections ionosphériques seulement pendant la passe finale. Un contrôle séparé est disponible pour la correction ionosphérique de la passe d'ambiguïté.


    Dialogue Editer style avancé - tabulation Evénements

Plus amples informations

Comment ...	Voir aussi
Editez ces contrôles pour définir le plan d'interpolation et le décalage d'heure utilisés pour calculer les positions et les heures d'événement .

Pour afficher la tabulation Evénements du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Evénements.

Lorsqu'un récepteur enregistre un événement, un indicateur d'événement est mis dans le fichier avec les mesures GPS. Cet indicateur d'événement comprend une marque d'heure indiquant l'heure à laquelle l'événement s'est produit. Etant donné que c'est rarement que les événements se produisent à l'instant exacte de la mesure des données,  le processeur GPS doit calculer les positions de récepteur avant et après l'événement, et puis interpoler la position où l'événement s'est produite.

Méthode d'interpolation

Sélectionnez l'une de ces options pour choisir la méthode d'interpolation linéaire ou quadratique pour dériver les positions d'événement lors du traitement des données cinématiques continues:

  Linéaire − sélectionnez cette option pour appliquer une interpolation linéaire simple utilisant les positions dérivées des solutions de ligne de base avant et après que l'événement s'est produit. Il faut un minimum de deux points, et jusqu'à cinq points peuvent être utilisés pour l'interpolation linéaire. Spécifiez le nombre de points à utiliser dans le champ Nombre de points à ajuster . La valeur par défaut est 2 points.

  Quadratique − sélectionnez cette option pour appliquer une interpolation s'ajustant à la courbe du deuxième ordre utilisant les positions dérivées des solutions de base avant et après que l'événement s'est produit. Il faut un minimum de trois points, et jusqu'à cinq points peuvent être utilisés pour l'interpolation quadratique. Spécifiez le nombre de points à utiliser dans le champ Nombre de points à ajuster. Le défaut est 3 points.

L'interpolation et la marque d'heure sont contrôlées par les options suivantes:

Nombre de points à ajuster

Editez ce champ pour spécifier le nombre de points utilisés pour interpoler la position d'un événement.

La valeur peut être utilisée pour contrôler le nombre de points utilisés par la méthode d'interpolation linéaire ainsi que quadratique. La valeur par défaut pour l'Interpolation linéaire est 2 points, et pour l'Interpolation quadratique la valeur par défaut est 3 points. S'il y a une insuffisance de points disponible, aucune interpolation ne sera effectuée.

Epoques manquantes maximum permises:

Editez ce champ pour contrôler le nombre maximum d'époques de mesure de données manquantes lors du calcul de la position d'un événement.

Considérez ces lignes directrices:

  La valeur saisie dans ce champ est utilisée comme une valeur de seuil pour la méthode d'interpolation  de la position d'événement. Si le nombre d'époques de mesure de données manquantes dépasse cette valeur, le processeur de lignes de base n'essayera pas d'interpoler une position d'événement. La valeur par défaut est 0. Il y a besoin d'au moins une mesure de données immédiatement avant et après l'heure de l'événement.

  L'augmentation de cette valeur peut aider à récupérer un événement que peut être n'a pas reçu une position interpolée à cause des données manquantes. Considérez un levé cinématique continu pour lequel les mesures GPS sont collectées à un taux de 1,0 secondes, et un événement est provoqué avec une marque d'heur de 245742,2 secondes. Lorsque le champ Epoques manquantes maximum permises est O, des solutions cinématiques continues aux heures 245742,0 et 245743,0 doivent être disponibles pour interpoler la position d'événement. L'augmentation de la valeur Epoques manquantes maximum permises à 1 permet le calcul de la position d'événement si s'il y a un vecteur disponible à l'heure 245744,0.

NOTE: L'augmentation excessive de cette valeur peut réduire la précision de la position interpolée.

Décalage d'heure

Editez ce champ pour appliquer un décalage d'heure constant entre l'heure enregistrée d'un événement dans le récepteur et l'heure actuelle à laquelle l'événement s'est produit.

Considérez ces lignes directrices:

  Le décalage d'heure est saisi en microsecondes et peut être négatif ou positif. Les valeurs positives retardent l'heure de l'événement en ajoutant le nombre spécifié de microsecondes à la marque d'heure. Les valeurs négatives ont l'effet opposé.

  Cette valeur est configurée sur zéro par défaut. Modifiez cette valeurs dans les cas où un périphérique externe est connecté au récepteur GPS et un décalage d'heure existe entre l'heure d'événement rapportée et l'arrivée actuelle de l'événement. Considérez le cas d'un appareil photographique aérien dans lequel l'obturateur est déclenché lors de la photographie de terrain géographique. L'appareil photographique indique l'événement au récepteur lorsque l'obturateur est déclenché, produisant un décalage d'heure selon la vitesse de l'obturateur. Si la vitesse de l'obturateur a été réglée à 0,0001 d'une seconde, la photo serait capturée 0,0001 d'une seconde après l'événement rapporté. Ce champ vous permet de compenser pour les décalages d'heure de ce type.


    Dialogue Editer style avancé - tabulation Recherche OTF

Plus amples informations

Comment ...	Voir aussi
Editez ces contrôles pour définir les variables utilisées pour spécifier la façon dont les recherches OTF (en vol) sont effectuées lors des passes de résolution d'ambiguïté

Pour afficher la tabulation Recherche OTF du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste de styles.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Recherche OTF.

Méthode de recherche

Sélectionnez l'une des options dans ce groupe pour contrôler la méthode de recherche d'ambiguïté utilisée lors du traitement cinématique OTF (en vol):

  Recherche optimale − sélectionnez cette option pour utiliser des valeurs flottantes pour toutes les ambiguïtés estimées pendant les passes initiales du traitement GPS. Après toutes les estimations sont calculées, les ambiguïtés flottantes sont recherchées et fixées aux valeurs de nombre entier si possible. Cette option est le défaut et elle fournit l'étude la plus minutieuse des données.

  Recherche séquentielle en avant − sélectionnez cette option pour utiliser une recherche séquentielle en avant lors du traitement des données. Les données sont recherchées en avant dans le temps, commençant avec les données les plus anciennes enregistrées et terminant avec les données les plus récentes enregistrées. Les recherches d'ambiguïté se produisent comme requises (par exemple, lorsque les dérapages de cycle sont détectés) pendant que les données sont étudiées progressivement. Les recherches en avant nécessitent moins de temps que la Recherche optimale.

  Recherche séquentielle en arrière − sélectionnez cette option pour utiliser une recherche séquentielle en arrière lors du traitement des données. Les données sont recherchées en arrière dans le temps, commençant avec les données les plus récentes enregistrées et terminant avec les données les plus anciennes enregistrées. Les recherches d'ambiguïté se produisent comme requises (par exemple, lorsque les dérapages de cycle sont détectés) pendant que les données sont étudiées progressivement. Les recherches en arrière nécessitent moins de temps que la Recherche optimale

NOTE: L'option Contrôle séquentiel détermine comment les données étudiées sont rejetées.

Contrôle séquentiel

Le champ Ratio de recherche minimum devient disponible selon l'option sélectionnée dans le groupe Méthode de recherche. Utilisez ce champ pour définir les critères de rejet utilisés pour échouer les données étudiées pendant les recherches OTF (en vol).

Vous pouvez éditer le ratio utilisé pour rejeter les recherches de données étudiées pendant les passes de résolution d'ambiguïté. Lorsque le ratio de la recherche est inférieur à la valeur saisie dans ce champ, la recherche immédiate est rejetée et les ambiguïtés pour la recherche ne sont pas réglées jusqu'à ce que toutes les autres données sont étudiées.


    Dialogue Styles de traitement GPS - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue
Vue d'ensemble

Utilisez ce dialogue pour sélectionner, afficher, éditer, créer, copier, renommer et supprimer le Style de traitement GPS actif. Pour l'ouvrir:

}  Sélectionnez Levé / Styles de traitement GPS.

Le dialogue Styles de traitement GPS s'affiche.

Les contrôles suivants sont disponibles:

Liste des styles

La sélection d'un style de cette liste le fait le Style actif. Un Style de traitement GPS doit être le Style actif avant de pouvoir l'éditer, copier, renommer ou supprimer. Le Style actif spécifié lorsque ce dialogue est fermé contient les contrôles qui seront utilisés lors de la session de traitement GPS suivante.

Editer

Cliquez sur ce bouton pour afficher ou éditer le style actif.

Nouveau

Cliquez sur ce bouton pour créer un nouveau style. Le dialogue Nouveau style s'affiche. Les paramètres de style par défaut du logiciel Trimble Geomatics Office sont utilisés. (Assurez-vous de configurer votre propre style de traitement GPS avant la suppression du style par défaut de Trimble.)

Copier

Cliquez sur ce bouton pour copier le style actif. Le dialogue Copier style s'affiche.

Renommer

Cliquez sur ce bouton pour renommer le style actif. Le dialogue Renommer style s'affiche.

Supprimer

Cliquez sur ce bouton pour supprimer le style actif.


    Dialogue Nouveau style

Plus amples informations

Comment ...	Comment ...
Utilisez ce dialogue pour créer un nouveau style de traitement GPS.

Pour afficher le dialogue Nouveau style:

1.	Sélectionnez Levé / Style de traitement  GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Cliquez sur Nouveau. Le dialogue Nouveau style s'affiche.

Nom

Utilisez ce champ pour nommer le nouveau style. Les noms de style peuvent comprendre jusqu'à 255 caractères, mais les noms plus courts sont plus facile à trouver dans la liste Styles.

NOTE: Après avoir cliqué sur OK pour quitter ce dialogue, le dialogue Editer styles s'affiche avec le nom du style dans le titre du dialogue. Vous pouvez éditer les paramètres de style généraux dans ce dialogue, et cliquez sur  Expert pour éditer les paramètres plus avancés.


    Dialogue Renommer style

Plus amples informations

Utilisez ce dialogue pour renommer un Style de traitement GPS.

Pour afficher le dialogue Renommer Style:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez le style requis de la liste. Le nom du style est souligné.

3.	Cliquez sur Renommer. Le dialogue Renommer style s'affiche.

Nom

Dans ce champ, saisissez le nouveau nom pour le style. Les noms de style peuvent comprendre jusqu'à 255 caractères, mais les noms plus courts sont plus facile à trouver dans la liste Styles.


    Dialogue Copier style

Plus amples informations

 Comment ...

Utilisez ce dialogue pour copier le Style de traitement GPS actif à utiliser comme la source d'un nouveau style.

Pour afficher le dialogue Copier style:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez le style à copier de la liste.

3.	Cliquez sur Copier. Le dialogue Copier style s'affiche.

Nom

Utilisez ce champ pour saisir le nom du nouveau style. Les noms de style peuvent comprendre jusqu'à 255 caractères, mais les noms plus courts sont plus facile à trouver dans la liste Styles.

NOTE: Après avoir cliqué sur OK pour quitter ce dialogue, le dialogue Editer styles s'affiche avec le nom du style dans le titre du dialogue. Vous pouvez éditer les paramètres de style généraux dans ce dialogue, et cliquez sur  Expert pour éditer les paramètres plus avancés.


    Dialogue Editer style avancé - tabulation Global

Plus amples informations

Comment ...	Dialogue	Voir aussi
Editez ces contrôles pour modifier les paramètres communs au traitement cinématique et statique.

Pour afficher la tabulation Global du dialogue Editer style avancé:

1.	Sélectionnez Levé / Styles de traitement GPS. Le dialogue Styles de traitement GPS s'affiche.

2.	Sélectionnez un style de la liste.

3.	Cliquez sur Editer. Le dialogue Editer style s'affiche.

4.	Cliquez sur Expert. Le dialogue Editer style avancé s'affiche.

5.	Sélectionnez la tabulation Global.

Type de fréquence

Sélectionnez une option de cette liste pour choisir le type de fréquence utilisé lors de la passe de traitement GPS finale:

  L1 − utilisez cette option pour sélectionner la fréquence porteuse L1  Le défaut est L1.

  L2 − utilisez cette option pour sélectionner la fréquence porteuse L2.

  Grande voie − utilisez cette option pour sélectionner l'observable à grande voie avec une longueur d'onde d'environ 86 cm, dérivée de la soustraction des ondes porteuses L1 et L2, ou L1 – L2.

  Voie étroite − utilisez cette option pour sélectionner l'observable à voie étroite avec une longueur d'onde d'environ 11 cm, obtenue de l'addition des ondes porteuses L1 et L2, ou L1 + L2.

Considérez ces lignes directrices:

  Lorsque le contrôle Passe finale est sélectionné sur la tabulation Iono, le Type de fréquence spécifié ici ne s'applique qu'aux lignes de base qui sont plus courtes que la valeur de seuil pour la Passe finale Iono.  Les lignes de base qui sont plus longues que la valeur de seuil pour la Passe finale Iono auront des solutions Iono libre.

  Les options L2, Grande voie, et Voie étroite ne s'appliquent pas si les données du projet comprennent des observation d'un récepteur à monofréquence . Toutes les données doivent être collectées avec les récepteur à bi-fréquence afin d'utiliser les options L2, Grande voie, et Voie étroite.

Dérapage maximum de cycle ajustable

Editez ce champ pour configurer la durée de temps maximum d'un dérapage de cycle que le processeur essayera de fixer lors du traitement de lignes de base.

Considérez ces lignes directrices:

  Le processeur GPS essayera de fixer les dérapages de cycle d'une durée inférieure ou égale à la limite de temps spécifiée.

  Le processeur GPS n'essayera pas de fixer les dérapages de cycle d'une durée supérieure au temps spécifié. Plutôt, le processeur GPS effectue une estimation des ambiguïtés séparées pour chaque côté du dérapage de cycle.

NOTE: L'arrivée des dérapages de cycle dans les mesures GPS peuvent être vérifiées visuellement en utilisant Timeline pour étudier la poursuite des satellites individuels. Les dérapages de cycle sont illustrés graphiquement des espaces dans les périodes porteuses L1 ou L2 le long de la ligne de temps. Pour plus amples informations, référez-vous à Timeline.

Itérations maximum

Editez ce champ pour configurer le nombre maximum d'itérations utilisées par le processeur de lignes de base lors du calcul des solutions de lignes de base. Vous pouvez saisir des valeurs de 1 à 99.

Considérez ces lignes directrices:

  Une moyenne de trois itérations de traitement de lignes de base sont effectuées par solution pour déterminer une ligne de base. Si dix itérations sont nécessaires, la solution du traitement de lignes de base pourrait être douteuse.

  En général dix itérations sont suffisantes. Ne modifiez pas ce champ à moins que vous comprenez son effet sur les ajustements par les moindres carrés .

Temps de recherche maximum de nombre entier

Editez ce champ pour limiter le temps que le processeur de lignes de base emploie effectuant une recherche de nombre entier. Ce contrôle est utilisé en principal pour le traitement des lignes de base longues, surtout lors de l'utilisation des données collectées pendant une période de temps longue, telle que 24 heures ou plus.

Considérez ces lignes directrices:

  Certaines conditions, telle que les coordonnées de station de référence mauvaises, pourraient causer le processeur GPS de rechercher littéralement milliards de combinaisons, qui pourrait prendre plusieurs heures à calculer. Cette limite de temps arrête la recherche après le temps spécifié est passé sans compléter la solution et continue avec une solution flottante.

  Le temps par défaut est 30 minutes.


    Dialogue Traitement GPS

Plus amples informations

Comment ...	Voir aussi
Le dialogue de traitement GPS indique:

  L'état du traitement

  Le nombre de lignes de base traités

  Le nombre de lignes de base qui ont été acceptées et rejetées

Pour ouvrir le dialogue Traitement GPS:

1.	Sélectionnez le groupe de lignes de base à traiter.

Les lignes de base sont soulignées dans la Fenêtre de graphiques.

2.	Pour commencer le traitement des lignes de base, effectuez l'une des choses suivantes:

  A partir du menu Levé, sélectionnez Traiter lignes de base GPS.

  A partir du groupe Trimble Survey dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  A partir de groupe de traitement dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le traitement des lignes de base commence.

Les contrôles suivants sont disponibles:

Liste de Traitement GPS

Regardez cette liste pour surveiller les résultats de la session de traitement GPS.

Indicateurs de l'état de traitement GPS

L'indicateur de progression à gauche de la barre d'état surveille la progression de chaque solution de traitement de ligne de base. Cliquant sur cet indicateur recentrera le dialogue Traitement GPS.

Le deuxième indicateur affiche les messages générés par le processeur GPS. Les points de début et les points de fin des lignes de base individuelles sont affichés lorsque la session continue.

Le nombre de fichiers à traiter et le nombre de lignes de base restantes à traiter s'affichent dans le troisième indicateur de barre d'état à droite. Cet indicateur indique En suspens après toutes les lignes de base sont traitées et avant de cliquer sur Enregistrer  pour stocker les solutions dans le projet.

L'indicateur d'état complètement à droite fournit un résumé du nombre de solutions de lignes de base acceptées et rejetées.

Lorsque la session de traitement est terminée, la barre d'état affiche En suspens, indiquant que les lignes de base ont été traitées mais ne sont pas enregistrées encore dans le projet. Un résumé de ligne de base à une ligne s'affiche dans un format tabulaire lorsque chaque ligne de base est complétée.

Arrêt / Enregistrer

Avant de compléter le traitement, vous pouvez cliquer sur Arrêt pour arrêter tout traitement ultérieur sans annuler la session de traitement de lignes de base. Après le traitement est terminé, le bouton Arrêt  devient le bouton Enregistrer. Cliquez sur Enregistrer  pour enregistrer les solutions sélectionnées dans la liste de Traitement GPS dans le projet. Les solutions de lignes de base sélectionnées sont indiquées par une coche dans la case Utiliser. Une opération d'enregistrement est également effectuée par Ecraser les solutions de lignes de base en double, comme décrit ci-dessous.

Annuler

Sélectionnez ce bouton à tout moment après le commencement du traitement GPS pour abandonner la session de traitement GPS. Considérez le suivant:

  Si le traitement GPS est déjà complété lorsque ce bouton est cliqué, un message de vérification s'affiche. Si vous cliquez sur Oui , les solutions traitées sont écartées et le dialogue ferme. Si vous cliquez sur Non, vous êtes retourné au dialogue Traitement GPS.

  Si le traitement GPS est en cours lorsque vous cliquez sur ce bouton, le traitement s'arrête après la solution de ligne de base courante est terminée et un message de vérification s'affiche. Si vous cliquez sur Oui , les solutions traitées sont écartées et le dialogue ferme. Si vous cliquez sur Non, vous êtes retourné au dialogue Traitement GPS.

Rapport

Sélectionnez ce bouton pour afficher le rapport de Traitement de lignes de base GPS pour la solution de ligne de base sélectionnée. Il faut sélectionner une solution de ligne de base de la liste de Traitement GPS avant que ce bouton devient disponible.

Lorsque le dialogue du rapport s'affiche, vous pouvez naviguer à travers le rapport pour rechercher des informations. Il n'est pas nécessaire d'attendre jusqu'à ce que tout le traitement des lignes de base est terminé avant d'afficher un rapport. Il est possible de générer des rapports dès que la première solution apparaît dans la liste de Traitement GPS.

Ecraser les solutions de lignes de base en double

Cette option contrôle comment les lignes de base sont enregistrées après le retraitement. La case à cocher est sélectionnée par défaut, qui signifie que les solutions existantes sont écrasées. Si la case à cocher est effacée, la nouvelle solution est ajoutée au projet et la solution précédente est conservée. Lorsque ce se produit, la nouvelle solution devient la solution active et la solution précédente devient inactive. La fenêtre Propriétés peut être utilisée pour changer une solution précédente à la solution active à nouveau.

La case à cocher Ecraser les solutions de lignes de base en double ne s'applique qu'aux lignes de base qui sont traitées plus qu'une fois. Il n'a aucun effet sur les lignes de base entre les mêmes deux points qui sont calculés à partir des données GPS collectées à une heure différente ou sur un jour différent. Trimble vous recommande de toujours écraser les solutions de lignes de base en double.


    Liste de Traitement GPS

Plus amples informations

Dialogue	Voir aussi
La liste de Traitement GPS fournit un résumé de solution d'une ligne dans un format tabulaire. Une ligne est ajoutée lorsque chaque ligne de base est terminée. L'ordre dont les résumés de lignes de base sont affichés peut être contrôlé en cliquant sur toute en-tête de colonne. Si vous cliquez sur l'en-tête de colonne l'ordre est trié selon les valeurs dans cette colonne. Le triage sert à l'identification rapide de toutes les lignes de base avec un ratio bas, un RMS élevé ou une variance de référence élevée.

La liste de Traitement GPS comprend les colonnes suivantes:

Utiliser

La case à cocher Utiliser est sélectionné lorsqu'une solution de ligne de base a été traitée et, basés sur les critères d'acceptance, les résultats sont Réussi ou Marquer. Si, basés sur les critères d'acceptance pour Ratio, Variance de référence et RMS, les résultats sont Echec, cette case est effacée. Seules des solutions de lignes de base pour lesquelles la case à cocher Utiliser est sélectionnées sont enregistrées dans les projet lorsque le bouton Enregistrer  est utilisé.

ID ligne de base

L'identificateur d'observation utilisé pour cette ligne de base dans le projet.

De station

Le point à partir duquel la ligne de base provient.

Vers station

Le point auquel la ligne de base se termine. Les coordonnées de ce point sont dérivées par l'ajout des composants de ligne de base aux coordonnées de la "de station".

Longueur de ligne de base

La distance inclinée de la ligne de base.

Type de solution

Le type de ligne de base final comme déterminé par le processeur. Dans la plupart des cas, le Type de solution sera L1 fixe, L1 flottant, Iono libre fixe, ou Iono libre flottant.

Ratio

Le Ratio est utilisé pour évaluer le rapport entre la variance de la meilleure solution de ligne de base à la deuxième meilleure solution de ligne de base (seules les solutions fixes).

Variance réf

La Variance de référence est un numéro dans unité établissant un rapport entre l'erreur actuelle et l'erreur attendue de la solution de ligne de base.

NOTE: Toujours effectuez l'évaluation du Ratio et la Variance de référence ensemble. Les lignes de base avec un ratio bas et une variance de référence élevée devraient recevoir plus d'attention et d'analyse ultérieure.

RMS

RMS  est la valeur quadratique moyenne de l'erreur de la solution des observations.

NOTE: Le résumé de la solution fournit un résumé court des résultats du traitement GPS. Pour effectuer une analyse détaillée des solutions de lignes de base individuelles, étudiez le rapport de Traitement de lignes de base GPS. Vous pouvez accéder à ce rapport immédiatement après le traitement des solutions individuelles en sélectionnant une solution de cette liste et en cliquant sur Rapport. Il n'est pas nécessaire d'attendre jusqu'à ce que toutes les solutions sont traitées avant d'afficher le rapport des lignes de base individuelles. Le processeur continuera de traiter les lignes de base pendant que vous étudiez les rapport de chaque solution.

Après que le dialogue Traitement GPS se ferme, vous pouvez afficher le rapport en sélectionnant la ligne de base dans la fenêtre de graphiques et en sélectionnant Rapport / Rapport de traitement de lignes de base GPS. Les informations comprises dans le rapport peuvent également être personnalisées du dialogue Configuration du rapport de traitement de lignes de base GPS .


    Ecraser les solutions de lignes de base en double

Plus amples informations

 Voir aussi

Cette option contrôle comment les lignes de base sont enregistrées après le retraitement. La case à cocher est sélectionnée par défaut, qui signifie que les solutions existantes sont écrasées. Si la case à cocher est effacée, la nouvelle solution est ajoutée au projet et la solution précédente est conservée. Lorsque ce se produit, la nouvelle solution devient la solution active et la solution précédente devient inactive. La fenêtre Propriétés peut être utilisée pour changer une solution précédente à la solution active à nouveau.

La case à cocher Ecraser les solutions de lignes de base en double ne s'applique qu'aux lignes de base qui sont traitées plus qu'une fois. Il n'a aucun effet sur les lignes de base entre les mêmes deux points qui sont calculés à partir des données GPS collectées à une heure différente ou sur un jour différent. Trimble vous recommande de toujours écraser les solutions de lignes de base en double.

Informations supplémentaires

Il y a beaucoup de considérations pour le traitement des données GPS. Pour plus amples informations concernant le traitement des lignes de base GPS, référez-vous aux rubriques suivantes:

  Détermination des lignes de base potentielles

  Sélection des lignes de base à traiter

  Sélection d'un Style de traitement GPS

  Démarrage du Processeur de lignes de base

  Affichage des résultats du traitement

  Enregistrement des résultats du traitement

  Retraitement des lignes de base


Traitement de lignes de base GPS - Contenu
Contenu

Les rubriques d'aide suivantes sont disponibles:

  Vue d'ensemble du Traitement de lignes de base GPS

  Traitement des lignes de base GPS

  Sources de données de lignes de base

  Commandes de traitement GPS

  Styles de traitement GPS

  Analyse des données du traitement GPS

  Rapport de traitement de lignes de base GPS

  Timeline

Pour savoir comment utiliser l'Aide, appuyer sur la touche F1.

Si vous avez un problème et vous ne pouvez pas trouver les informations requises dans ce système d'Aide, contactez votre agent local ou consultez le Support technique.

© 1999−2001, Trimble Navigation Limited. Tous droits réservés.


    Rapport de traitement de lignes de base GPS - Vue d'ensemble

Plus amples informations

Comment...	Voir aussi
Vue d'ensemble

Utilisez le rapport de Traitement de lignes de base GPS pour afficher des informations détaillées concernant les solutions de lignes de base.

Pour y accéder:

1.	Traitez les lignes de base. Le dialogue Traitement GPS  s'affiche.

2.	Sélectionnez une solution de lignes de base de la liste Traitement GPS. La solution est soulignée.

3.	Cliquez sur Rapport. Le rapport de Traitement de lignes de base GPS pour la solution de lignes de base s'affiche.

Le rapport de Traitement de lignes de base  GPS peut contenir les sections suivantes:

  Résumé du traitement

  Composants de lignes de base

  Occupations

  Résumés de poursuite

  Résidus

  Style de traitement

Les sections comprises dans le rapport sont déterminées par les paramètres courants dans le dialogue Configuration du rapport de traitement de lignes de base GPS et les types de données traitées pour chaque ligne de base.


    Dialogue Editer style avancée - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

Les styles de traitement GPS vous permettent de personnaliser votre traitement pour des exigences spécifiques, tels que le traitement avec une éphéméride précise ou un masque d'élévation spécifique. Les paramètres peuvent être enregistrés comme un style nommé et rappelés plus tard tout simplement en spécifiant le nom du style. Ainsi il est possible de développer une bibliothèque de styles de traitement pour répondre aux scénarios de traitement communs.

Les contrôles les plus communs sont facilement accessibles du dialogue Style de traitement GPS principal. Des contrôles avancés supplémentaires sont également disponibles pour l'affichage et l'édition. Ces contrôles de traitement avancés sont organisés dans un seul dialogue et séparés par des tabulations.

Les tabulations suivantes sont disponibles:

  Statique

  Cinématique

  Global

  Qualité

  Tropo

  Iono

  Evénements

  Recherche OTF


    Sources de données GPS - Vue d'ensemble

Plus amples informations

 Voir aussi

Vue d'ensemble

Le processeur de lignes de base utilise les mesures effectuées par des récepteurs GPS pour calculer les lignes de base. Ces mesures peuvent être stockées dans, ou référencées par:

  Carnets de terrain de Trimble (*.dc)

  Récepteurs de Trimble (*.dat)

  Récepteurs d'autres fabricants (RINEX)

En sus des mesures GPS, ces sources également fournissent des informations utilisées pour déterminer comment il faut traiter les mesures GPS, par exemple si un récepteur est immobile sur un point, ou s'il est mobile. Ce permet au processeur de lignes de base de classer les mesures GPS par catégories comme suit:

  Données GPS statique/Statique rapide

  Données cinématique

  Données cinématique continu et mobile


    Styles de traitement GPS - Vue d'ensemble

Plus amples informations

Comment...	Dialogue	Voir aussi
Vue d'ensemble

Les styles de traitement GPS vous permettent de personnaliser votre traitement pour des exigences spécifiques, tels que le traitement avec une éphéméride précise ou un masque d'élévation spécifique. Les paramètres peuvent être enregistrés comme un style nommé et rappelés plus tard tout simplement en spécifiant le nom du style. Ainsi il est possible de développer une bibliothèque de styles de traitement pour répondre aux scénarios de traitement communs. Les styles de traitement GPS s'appliquent au système entier. Les nouveaux styles, ou les modifications effectuées à un style existant, sont disponibles à utiliser dans tous le projets sur un seul PC.

Le dialogue Styles de traitement GPS est le centre de contrôle pour le travail avec les styles. Le style sélectionné actuellement est dénommé le Style actif. Le Style actif est utilisé pour fournir les contrôles de traitement au processeur de lignes de base pour les sessions de traitement subséquentes dans ce projet. Les projets différents peuvent avoir des Styles actifs différents, et il est possible de changer le Style actif entre les sessions de traitement de lignes de base. Le dialogue Styles de traitement GPS également possède la capacité d'éditer, copier, créer, renommer et supprimer les styles.

Le logiciel Trimble Geomatics Office est livré avec le style de traitement GPS par défaut de Trimble. Pour la plupart des applications de levé il n'est pas nécessaire de modifier ce style. Si vous modifiez les contrôles, assurez-vous de bien comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications.

Pour plus amples informations, référez-vous à Edition des styles.


    Traitement de lignes de base GPS - Vue d'ensemble

Plus amples informations

 Voir aussi

Vue d'ensemble

Le logiciel Trimble Geomatics Office fournit la capacité de générer les solutions de lignes de base GPS post traitées lorsque le module processeur de lignes de base est installé. Le module de processeur de lignes de base comprend WAVE™, Weighted Ambiguity Vector Estimator (Estimateur du vecteur d'ambiguïté pondéré). Ce programme calcule les solutions de ligne de base des observations GPS sur le terrain effectuées en utilisant les procédures de collecte de données statique, Statique rapide, ou cinématique. Le processeur de lignes de base utilise la phase porteuse et les observations de code pour produire les lignes de base GPS en trois dimensions entre les points de levé.

Le post traitement dans le logiciel Trimble Geomatics Office est simple. Le processeur de lignes de base est livré déjà configuré avec les valeurs par défaut du système qui répondent aux exigences de la plupart des projets de levé. Il est également possible de modifier et enregistrer les contrôles de post traitement dans des Styles de traitement GPS nommés, pour les scénarios de traitement avancé et de retraitement.

Les sessions de traitement séparées ne sont pas requises pour les données GPS collectées utilisant des techniques de levé différentes. Le processeur de lignes de base vérifie les données à traiter et puis fait les décisions automatiquement concernant les stratégies de traitement. Il est possible de traiter les levés cinématique, Statique et Statique rapide tous au même temps sans la nécessité de beaucoup de configuration à l'avance, en fait presque rien.


    Détermination des lignes de base potentielles

Plus amples informations

 Voir aussi

Une ligne de base potentielle s'affiche dans la fenêtre de graphiques dès que vous importez des mesures GPS collectées par deux récepteurs qui également se chevauchent en fonction de  temps. La quantité de chevauchement de temps doit se conformer au minimum requis pour le traitement. Les lignes de base potentielles peuvent être, mais ne sont pas encore, traitées par le processeur de lignes de base.

Les lignes de base potentielles sont déterminées automatiquement par le logiciel Trimble Geomatics Office. Chaque fois que des nouvelles mesures GPS sont importées dans un projet, le logiciel recherche pour des autres groupes de données  se chevauchant qui peuvent être traités. Une ligne de base potentielle est ajoutée au projet chaque fois qu'il y a un chevauchement de temps entre deux groupes de données qui se conforment à ou dépassent la valeur spécifiée pour le temps d'observation minimum de lignes de base du style de traitement GPS actif, ou chaque fois qu'un identificateur d'occupation est rencontré dans les groupes de données cinématique.

NOTE: Si vous avez téléchargé les segments de données d'une durée d'une heure à partir d'une station GPS, avant d'importer les données dans le logiciel Trimble Geomatics Office, combinez-les dans un seul fichier, à l'aide de l'utilitaire Rinmerge.


    Sélection des lignes de base à traiter

Plus amples informations

 Voir aussi

Le défaut est de traiter toutes les lignes de base potentielles dans un projet lorsque l'option Levé / Traiter lignes de base GPS est sélectionnée. Aucune étape ou sélection supplémentaire n'est requise pour traiter toutes les lignes de base GPS potentielles lorsqu'elles sont ajoutées au projet.

Sinon, une ou plusieurs lignes de base spécifiques peuvent être identifiées pour le traitement ou le retraitement, en sélectionnant seules ces lignes de base avant la sélection de l'option Levé / Traiter lignes de base GPS. Lorsqu'une ou plusieurs lignes de base sont sélectionnées, seulement le groupe de sélection est considérée.

Utilisez n'importe quelle des méthodes standard pour effectuez les sélections:

  cliquez sur une ou plusieurs lignes de base dans la fenêtre de graphiques

  sélectionnez par interrogation

  le groupe de sélection précédent

NOTE: Si le processeur de lignes de base affiche un message indiquant qu'aucune ligne de base n'a été sélectionnée sans traiter toutes les lignes de base potentielles dans un projet, il se peut que vous avez spécifié un groupe de sélection que ne comprend pas des lignes de base GPS ou des bases cinématiques. Lorsque c'est le cas, cliquez dans une zone vide de la carte dans la fenêtre de graphiques et puis redémarrez le processeur de lignes de base. Les options Afficher filtres peuvent également servir dans l'identification d'un sous-groupe de vecteurs pour le traitement ou le retraitement.

Si le projet contient des données cinématique continue le défaut est de traiter toutes les bases cinématique non traitées. Pour traiter les données cinématique continue d'une base spécifique, sélectionnez le point auquel la base s'est trouvée, et puis commencez le traitement.

Les lignes de base sont traitées en séquence. La direction de la ligne de base, quelle station est utilisée comme la base et quelle station est utilisée comme le mobile, est déterminée automatiquement par le processeur. La direction est optimisée pour le transfert des coordonnées précises. Ce transfert des coordonnées de contrôle précises d'un point à un autre est connu comme la classification des coordonnées. Le processeur de lignes de base choisit automatiquement les points de la plus haute qualité dans la session de traitement à utiliser comme la classe de coordonnées et les lignes de base sont calculées de ces points.

Dans la plupart des cas le processeur sélectionnera la direction appropriée pour le traitement, notamment si la configuration des sessions d'observation sur le terrain et de contrôle est effectuée soigneusement. Dans certaines instances, néanmoins, il se peut qu'il faut changer la direction de la ligne de base par l'échange de la base et le mobile. Pour changer la direction de flux de la ligne de base après le traitement, sélectionnez la ligne de base sur la carte dans la fenêtre de graphiques, et puis sélectionnez Editer / Inverser flux d'observation.

La direction du flux de la ligne de base peut également être utilisée pour imposer le traitement dans une direction particulière. Une flèche sur la ligne de base indique la direction du flux. Inversez le flux, si nécessaire, pour imposer le traitement dans la direction requise.

NOTE: Si vous avez téléchargé des segments de données d'une durée d'une heure à partir d'une station de base GPS, avant d'importer les données dans le logiciel Trimble Geomatics Office, combinez-les dans un seul fichier, à l'aide de l'utilitaire Rinmerge.


    Sélection du style de traitement GPS

Plus amples informations

Comment ...	Dialogue
Les styles de traitement GPS vous permettent de personnaliser votre traitement pour des exigences spécifiques, tel que le traitement avec une éphéméride précise ou un masque d'élévation spécifique. Ces paramètres peuvent être enregistrés comme un style nommé et rappelés plus tard tout simplement en spécifiant le nom du style. Ainsi il est possible de développer une bibliothèque de styles de traitement pour répondre aux scénarios de traitement communs. Les styles de traitement GPS s'appliquent au système entier. Les nouveaux styles, ou les modifications effectuées à un style existant, sont disponibles à l'utiliser dans tous le projets sur un seul PC.

Le dialogue Styles de traitement GPS est le centre de contrôle pour le travail avec les styles. Le style sélectionné actuellement est dénommé le Style actif. Le Style actif est utilisé pour fournir les contrôles de traitement au processeur de lignes de base pour les sessions de traitement subséquentes dans ce projet. La sélection d'un style de la liste de styles rend ce style le style actif courant pour ce projet.

Les projets différents peuvent avoir des Styles actifs différents, et il est possible de changer le Style actif entre les sessions de traitement de lignes de base. Le dialogue Styles de traitement GPS également possède la capacité d'éditer, copier, créer, renommer et supprimer les styles.

Le logiciel Trimble Geomatics Office est livré avec le style de traitement GPS par défaut de Trimble. Pour la plupart des applications de levé il n'est pas nécessaire de modifier ce style. Si vous modifiez les contrôles, assurez-vous de bien comprendre les effets éventuels de ces modifications avant d'enregistrer les modifications


    Quand utiliser le processeur de lignes de base GPS

Plus amples informations

 Voir aussi

La plupart des topographes traitent les données de levé immédiatement après les sessions sur le terrain pour déterminer si toute ligne de base a besoin d'une réobservation.

Avant d'utiliser le processeur de lignes de base, effectuez l'une des choses suivantes:

  Créez le projet.

  Projetez les observations de terrain (recommandé).

  Collectez les données sur le terrain.

  Téléchargez les données des récepteurs, des périphériques de levé ou de votre ordinateur au projet du logiciel Trimble Geomatics Office.

Normalement, le traitement de lignes de base n'est pas l'étape finale dans un projet de levé GPS. Vos résultats de traitement refléteront la qualité en général de vos mesure GPS, mais pour effectuer un levé de haute qualité, il faut comprendre un ajustement de réseau de toutes vos observations. L'ajustement de réseau aidera la détermination de la consistance de vos lignes de base observées dans le réseau et effectuera la génération des coordonnées finales. Référez-vous à l'aide d'Ajustement de réseau du logiciel Trimble Geomatics Office.


    Commandes de traitement de lignes de base GPS - Vue d'ensemble

Plus amples informations

 Voir aussi

Vue d'ensemble

Les commandes de traitement de lignes de base GPS sont disponibles sur les menus Levé et Rapport.

Les commandes de Levé suivantes sont disponibles:

  Styles de traitement GPS

  Traitement GPS

Le menu Rapport a les commandes suivantes disponibles:

  Rapport de traitement de lignes de base GPS

  Configuration du rapport de traitement de lignes de base GPS

Le menu Affichage a les commandes suivantes disponibles:

  Timeline

  Planification des reports (Barres d'outils)

  Timeline (Barres d'outils)

Les commandes de Vue de levé sont utiles aussi avant et après le traitement des lignes de base GPS:

  Rapport de fermetures de boucle GPS

  Recalculer

  Rapport de recalcul

  Timeline


    Traitement de lignes de base GPS - Vue d'ensemble

Le processeur de lignes de base calcule les lignes de base des observations GPS sur le terrain effectuées utilisant des procédures de collecte de données cinématique, statique ou statique rapide. Le processeur de lignes de base utilise la phase porteuse et les observations de code pour produire les lignes de base GPS en trois dimensions entre les points de levé.

Il y a beaucoup de considérations pour le traitement de données GPS. Pour plus amples informations concernant le traitement de lignes de base GPS, référez-vous aux rubriques suivantes:

  Détermination des lignes de base potentielles

  Sélection des lignes de base à traiter

  Sélection d'un style de traitement GPS

  Démarrage du processeur de lignes de base

  Affichage des résultats de traitement

  Enregistrement des résultats de traitement

  Retraitement de lignes de base


    Démarrage du processeur de lignes de base GPS

Plus amples informations

Comment ...	Dialogue	Voir aussi
Le processeur de lignes de base n'est disponible que si vous travaillez sur la Vue de levé et vous avez importé deux ou plusieurs fichiers avec des mesures GPS dans votre projet.

Traitement de toutes les lignes de base potentielles

Pour traiter toutes les lignes de base potentielles:

1.	Ouvrez un projet contenant une ou plusieurs lignes de base potentielles.

2.	Pour démarrer le processeur, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Du Groupe levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Du groupe Traiter dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le processeur de lignes de base commence le traitement de toutes les lignes de base potentielles.

Traitement d'une ou plusieurs lignes de base sélectionnées

Pour traiter ou retraiter une ou plusieurs lignes de base sélectionnées:

1.	Ouvrez un projet contenant une ou plusieurs lignes de base potentielles ou enregistrées.

2.	Pour créer un groupe de sélection des lignes de base à traiter utilisant n'importe quelle des méthodes de sélection standard, effectuez l'une des choses suivantes:

  Cliquez sur une ou plusieurs lignes de base dans la fenêtre de graphiques

  Sélectionnez par interrogation

  Le groupe de sélection précédent

3.	Les lignes de base sélectionnées s'affichent dans la fenêtre de graphiques sous forme d'une ligne plus épaisse.

4.	Pour démarrer le processeur, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Du Groupe levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Du groupe Traiter dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le processeur de lignes de base commence le traitement de toutes les lignes de base sélectionnées.

Traitement des lignes de base cinématique continu

Pour traiter les lignes de base cinématique continu:

1.	Ouvrez un projet contenant des données cinématique continu.

2.	Sélectionnez le point auquel le récepteur de base s'est trouvé lors du levé.

3.	Pour démarrer le processeur, effectuez l'une des choses suivantes:

  De menu Levé, sélectionnez Traiter lignes de base GPS.

  Du Groupe levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Du groupe Traiter dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le processeur de lignes de base commence le traitement de toutes les lignes de base cinématique.

Traitement d'un groupe spécifique de lignes de base cinématique

Pour traiter un groupe spécifique de lignes de base cinématique:

1.	Ouvrez un projet contenant des données cinématique continu.

2.	Pour afficher Timeline, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

La zone d'affichage Timeline s'affiche.

3.	Sélectionnez l'occupation du récepteur de base pour le levé.

4.	Pour démarrer le processeur, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Du Groupe levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Du groupe Traiter dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Appuyez sur F9.

Le dialogue Traitement GPS s'affiche et le processeur de lignes de base commence le traitement de toutes les lignes de base sélectionnées.

Surveillance de la barre d'état du dialogue Traitement GPS

La barre d'état, qui se trouve en bas du dialogue Traitement GPS, indique le progrès de chaque fichier pendant son chargement afin d'être traité. Les noms de De station et Vers station s'affichent pour chaque ligne de base pendant le traitement, et un résumé d'une ligne avec les résultats du traitement s'affiche dans la liste de Traitement GPS lors de la terminaison de chaque ligne de base. Le processeur de lignes de base continue avec le traitement de la ligne de base suivante. La barre d'état est mise à jour après chaque ligne de base pour indiquer l'état courant.  En plus, elle affiche un compte de lignes de base acceptées (Acc) et rejetées (Rej), basé sur les critères d'acceptance par défaut configurés dans le Style de traitement GPS actif.

Pour plus amples informations concernant une session de traitement de lignes de base, référez-vous au Journal de traitement de lignes de base.


    Affichage des résultats de traitement

Plus amples informations

Comment ...	Dialogue	Voir aussi
Le dialogue Traitement GPS s'affiche automatiquement lorsque vous traitez vos lignes de base. La barre d'état, qui se trouve en bas de ce dialogue, indique le progrès de chaque fichier lors de son chargement. Les noms de De station et Vers station s'affichent pour chaque ligne de base pendant le traitement, et un résumé à une ligne avec les résultats du traitement s'affiche dans la liste de Traitement GPS lors de la terminaison de chaque ligne de base. Le processeur de lignes de base continue avec le traitement de la ligne de base suivante. La barre d'état est mise à jour après chaque ligne de base pour indiquer l'état courant.  En plus, elle affiche un compte de lignes de base acceptées (Acc) et rejetées (Rej), basé sur les critères d'acceptance par défaut configurés dans le Style de traitement GPS actif.

Pour plus amples informations, référez-vous aux rubriques suivantes:

  Utilisation du dialogue Traitement GPS

  Utilisation du Rapport de traitement de lignes de base GPS


    Utilisation du dialogue Traitement GPS

Plus amples informations

Comment ...	Dialogue	Voir aussi
Le dialogue Traitement GPS indique:

  l'état du traitement

  le nombre de lignes de base traitées

  le nombre de lignes de base acceptées et rejetées

  un résumé à une ligne des résultats de traitement dans un format tabulaire

  l'état en suspens des lignes de base traitées

Le dialogue Traitement GPS également fournit la capacité de:

  enregistrer les résultats de traitement de lignes de base au projet

  générer un Rapport de traitement de lignes de base GPS

  contrôler comment les lignes de base sont enregistrées après le retraitement

Les contrôles suivants sont disponibles:

Liste de Traitement GPS

Etudiez cette liste pour surveiller les résultats de la session de traitement GPS. Pour plus amples informations concernant les colonnes de la liste, référez-vous à Liste de Traitement GPS.

Indicateurs d'état du traitement GPS

Un indicateur du Traitement GPS est affiché sur la barre d'état. Cliquant sur cet indicateur recentrera le dialogue Traitement GPS.

L'indicateur de progrès à gauche de la barre d'état surveille le progrès de chaque solution de traitement de lignes de base.

Le deuxième indicateur affiche les messages générés par le processeur GPS. Les points de début et de fin des lignes de base individuelles s'affichent pendant la session.

Le nombre de fichiers à traiter et le nombre de lignes de base restantes à traiter s'affichent dans le troisième indicateur de barre d'état à droite. Cet indicateur indique En suspens après toutes les lignes de base sont traitées et avant de cliquer sur Enregistrer  pour stocker les solutions dans le projet.

L'indicateur d'état le plus à droite donne un résumé du nombre de solutions de lignes de base acceptées et rejetées.

Arrêt / Enregistrer

Avant que le traitement est terminé, vous pouvez cliquer sur Arrêt pour arrêter tout traitement ultérieur sans annuler la session de traitement de lignes de base. Après le traitement est terminé, le bouton Arrêt devient le bouton Enregistrer. Sélectionnez Enregistrer  pour enregistrer les solutions sélectionnées dans la liste de Traitement GPS dans le projet. Les solutions de lignes de base sélectionnées sont indiquées par une coche dans la case Utiliser. Une opération d'enregistrement est également influencée par la case à  cocher Ecraser les solutions de lignes de base en double, comme décrit dessous.

Annuler

Sélectionnez ce bouton à tout moment après le commencement du traitement GPS pour abandonner la session de traitement GPS.

  Si le traitement GPS est déjà terminé lorsque vous cliquez sur ce bouton, un message de vérification s'affiche. Si vous cliquez sur Oui, les solutions de traitement sont écartées et le dialogue ferme. Si vous cliquez sur Non, vous êtes retourné au dialogue Traitement GPS.

  Si le traitement GPS est en cours lorsque vous cliquez sur ce bouton, le traitement s'arrête après la solution de lignes de base courante est terminée et un message de vérification s'affiche. Si vous cliquez sur Oui, les solutions de traitement sont écartées et le dialogue ferme. Si vous cliquez sur Non, vous êtes retourné au dialogue Traitement GPS.

Rapport

Sélectionnez ce bouton pour afficher le Rapport de traitement de lignes de base GPS pour la solution de lignes de base sélectionnée. Une solution de lignes de base doit être sélectionnée de la liste de Traitement GPS avant que ce bouton devient disponible.

Ecraser les solutions de lignes de base en double

Cette option contrôle comment les lignes de base sont enregistrées après le retraitement. La case à cocher est sélectionnée par défaut, qui signifie que les solutions existantes sont écrasées. Si la case à cocher est effacée, la nouvelle solution est ajoutée au projet et la solution précédente est conservée. Lorsque ce se produit, la nouvelle solution devient la solution active et la solution précédente devient inactive. La fenêtre Propriétés peut être utilisée pour changer une solution précédente à la solution active à nouveau.

La case à cocher Ecraser les solutions de lignes de base en double ne s'applique qu'aux lignes de base qui sont traitées plus qu'une fois. Il n'a aucun effet sur les lignes de base entre les mêmes deux points qui sont calculés à partir des données GPS collectées à une heure différente ou sur un jour différent. Trimble vous recommande de toujours écraser les solutions de lignes de base en double


    Utilisation du Rapport de traitement de lignes de base GPS

Plus amples informations

Comment ...	Dialogue	Voir aussi
Le Rapport de traitement de lignes de base GPS fournit des informations détaillées concernant une solution de base.

Pour générer un Rapport de traitement GPS, effectuez l'une de choses suivantes:

  Double-cliquez sur une ligne de base dans le dialogue Traitement GPS.

  Sélectionnez une ligne de base dans le dialogue Traitement GPS, et cliquez sur Rapport.

  Sélectionnez une ligne de base dans la fenêtre de graphiques et sélectionnez Rapports / Rapport de traitement de lignes de base GPS

Le Rapport de traitement de lignes de base GPS peut être utilisé pour:

  Etudier les détails d'une solution de lignes de base qui ne sont pas disponibles dans le résumé d'une ligne, tels que des erreurs dans NEH (Nord-Est-Haut), ou le nombre de mesures utilisées et le nombre rejetées.

  Vérifier les informations de station dans la solution contre vos notes de terrain. Il faut faire attention à:

  Les noms de station

  Les hauteurs, les types et les méthodes de mesure d'antenne

  Les heures de début et arrêt

  Vérifiez le Résumé de poursuite de phase de satellite à chaque station pour des interruptions dans le signal L1 ou L2.

  Vérifiez le Résumé de poursuite de phase de satellite combiné. Les ombres gris indiquent les mesures actuellement utilisées dans la solution de lignes de base.

  Vérifier les reports résiduels de chaque satellite. Ils affichent le RMS de chaque satellite utilisé pour déterminer la solution de lignes de base.


    Enregistrement des résultats de traitement

Plus amples informations

Dialogue	Voir aussi
Cliquez sur le bouton Enregistrer dans le dialogue Traitement GPS pour enregistrer les solutions de lignes de base sélectionnées dans la liste de Traitement GPS dans le projet. Les solutions de lignes de base sont indiquées par une coche dans la case Utiliser.

Si la session de traitement comprend des lignes de base retraitées, l'enregistrement sera influencé par la case à cocher Ecraser les solutions de lignes de base en double. Cette option contrôle comment les lignes de base sont enregistrées après le retraitement. La case à cocher est sélectionnée par défaut, qui signifie que les solutions existantes sont écrasées. Si la case à cocher est effacée, la nouvelle solution est ajoutée au projet et la solution précédente est conservée. Lorsque ce se produit, la nouvelle solution devient la solution active et la solution précédente devient inactive. La fenêtre Propriétés peut être utilisée pour changer une solution précédente à la solution active à nouveau.

La case à cocher Ecraser les solutions de lignes de base en double ne s'applique qu'aux lignes de base qui sont traitées plus qu'une fois. Il n'a aucun effet sur les lignes de base entre les mêmes deux points qui sont calculés à partir des données GPS collectées à une heure différente ou sur un jour différent. Trimble vous recommande de toujours écraser les solutions de lignes de base en double


     L1 fixe

 Vue d'ensemble et plus amples informations

Pour les lignes de base courtes d'une longueur de quelques kilomètres, une passe finale de L1 seul est générée au lieu d'Iono libre fixe lors de l'utilisation des données à bi-fréquence pour le traitement. Cependant, cette solution L1 seul finale est générée utilisant des données à bi-fréquence pour aider à dériver les ambiguïtés L1. Pour les lignes de base d'environ 5 kilomètres ou moins, la solution L1 fixe en général est préférable parce qu'il y a moins de bruit dans la solution.

La valeur utilisée comme le seuil pour les solutions L1 seul peut être configurée utilisant le Style de traitement GPS.


    Iono libre fixe

 Vue d'ensemble et plus amples informations

La solution Iono libre fixe est la solution optimale sous la plus grande étendue de conditions. Ces solutions ne contiennent aucun biais ionosphérique, et les ambiguïtés fixes produisent les meilleurs résultats en général.

Cependant, une solution Iono libre fixe sur des lignes plus courtes peut être une solution faible. Evitez l'utilisation de telles solutions pour les lignes de base courtes. Le logiciel Trimble Geomatics Office identifie les lignes de base courtes automatiquement et sélectionne le type de solution finale appropriée.

Référez-vous à Fixe L1 pour plus amples informations.


    L1 flottant

 Vue d'ensemble et plus amples informations

Lors du traitement des données à monofréquence, le processeur de lignes de base génère une solution de passe finale L1 fixe si les ambiguïtés L1 peuvent être déterminées avec succès. Si, cependant, la recherche L1 ne réussit pas, une solution L1 flottant est générée. Une  Solution L1 flottant peut se produire à cause d'une occupation trop courte ou des observations anormalement bruyantes. Pour les lignes de base de 10 à 15 kilomètres et plus, il peut devenir de plus en plus difficile d'obtenir des solutions L1 fixe fiables à cause de la sensibilité des observations à monofréquence aux délais ionosphériques.

En général les solutions L1 flottant sont plus faibles que les solutions à nombre entier fixe. Pour les applications de levé standard, Trimble ne recommande pas l'utilisation des solutions L1 flottant. Il faut retraiter vos données ou réobserver ces lignes de base.

La décision de produire une solution à nombre entier est contrôlé par le seuil de ratio spécifié internement par le processeur de lignes de base. Le seuil est configuré internement par le processeur sur 1,5. Lorsque le ratio calculé est inférieur à cette valeur de seuil de ratio interne, des solutions flottantes sont produites..


    Iono libre flottant

 Vue d'ensemble et plus amples informations

Une solution Iono libre flottant sur les lignes de base de plus de 30 kilomètres peut être une très bonne solution, mais assurez-vous de la vérifier. Sur des lignes de base très longues, il se peut qu'une solution Iono libre flottante est la meilleure que vous pouvez obtenir. Les temps d'occupation plus longs produisent des meilleures solutions Iono libre flottant, car l'observable Iono libre sans biais permet à la solution de converger vers le résultat géométrique correct. En fait, les solutions Iono libre flottant sur des lignes très longues, occupées pour plusieurs heures, peuvent produire des résultats excellents.

Pour des lignes de base très longues (centaines de kilomètres jusqu'à milliers de kilomètres), sélectionnez un type de solution flottante pour générer une solution Iono libre flottant utilisant les données à bi-fréquence. Comme déjà indiqué, les temps d'occupation longs sur les lignes très longues peuvent produire des solutions Iono libre flottant excellentes.

La valeur utilisée comme le seuil des solutions flottantes pour des lignes de base très longues peut être configurée utilisant le Style de traitement GPS. Il est possible de configurer des critères séparés pour l'utilisation de l'éphéméride précise et diffusée.


    Analyse des données du traitement GPS - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

L'évaluation de la qualité des mesures est une tâche importante. Du fait que la technique d'observation elle-même (la collecte des données de phase porteuse des satellites) n'est pas aussi évidente que la mesure des distances et des angles par les techniques plus classiques, il faut compter sur des outils de post traitement pour évaluer les résultats. Il y a plusieurs lignes directrices simples qui, si elles sont suivies soigneusement, produiront des meilleurs levés GPS.

Si les résultats du traitement de lignes de base ne sont pas aussi satisfaisants que ceux attendus, il y a plusieurs options pour améliorer vos résultats avant de sortir à nouveau pour réobserver ces lignes de base problématiques. Les informations dans le Rapport de traitement de lignes de base GPS peut vous aider à identifier toute interférence au signal de satellite et d'isoler l'heure d'observation à laquelle les problèmes de signal se sont produits. Ce rapport peut être utile si vous décidez de retraiter les données utilisant un Style de traitement GPS différent.

Problèmes potentiels

Des mauvais résultats de traitement GPS peuvent se produire à cause d'une variété de raisons, y compris:

  des erreurs sur le terrain, par exemple:

  les mesures de hauteur d'antenne incorrectes

  la dénomination incorrecte des stations

  les erreurs de centrage du trépied

  les inconsistances des configurations de récepteur, par exemple:

  le taux de sync

  les SV activés et désactivés

  les formats des données

  La collecte de données sur les conditions marginales, par exemple:

  l'observation de trop peu de satellites

  un PDOP élevé

  trop de satellites aux angles d'élévation bas

  les mauvaises conditions de multitrajet

  beaucoup de dérapages de cycle

  une insuffisance de temps d'occupation

La première catégorie des erreurs potentielles sont des erreurs d'opérateur.  Vous pouvez réduire ces erreurs par le choix de bonnes procédures sur le terrain. La mesure et l'enregistrement des hauteurs d'antenne sous forme de pieds ainsi que mètres, et puis leur enregistrement au début et à la fin des occupations, aide à éliminer des erreurs de mesure. L'utilisation d'un trépied à hauteur fixe aide à réduire des erreurs de lecture de la bande et évite la transposition subséquente des chiffres. La réalisation des notes de terrain claires et précise  pour les noms de station, les emplacements, les temps d'observation et les hauteurs d'antenne peut être inappréciables s'il y a des questions lors du traitement des données.

La deuxième catégorie des erreurs potentielles est plus difficile à réconcilier. Idéalement, un levé GPS aurait toujours six satellites, un bon PDOP, l'absence des arbres et une visibilité excellente. Donc, il est nécessaire de formuler et suivre des méthodes de terrain confirmées qui tiennent en compte ces conditions du monde réel.

Amélioration de la qualité

Il y a un nombre d'étapes que vous pouvez effectuer afin de maximiser la précision de vos résultats de levé GPS. Considérez ces lignes directrices:

  Choisissez les meilleures conditions possibles, étant donné les contraintes de l'étude. Utilisez l'utilitaire QuickPlan pour choisir des périodes de bon PDOP et une suffisance de satellites. Pour maximiser la qualité de vos résultats verticaux, étudier le VDOP aussi.

  Visitez vos stations à l'avance pour rechercher des obstructions et des sources éventuelles de multitrajet; installez les stations qui sont très obstruées ailleurs (si possible). C'est très important pour les stations de base des levés cinématique.

  Vérifiez que les paramètres de tous les récepteurs utilisées pendant la même session de levé sont compatibles.

  Observez durant une période de temps suffisante, compte tenu des conditions. Si vous n'êtes pas sûr des lignes directrices, prolongez vos temps d'observation un peu jusqu'à ce que vous avez plus de compétence. Dans le cas des levés cinématique, il faut faire une attention particulière aux initialisations, en ajoutant du temps supplémentaire aux initialisations statique ou aux périodes d'initialisation en vol. Si vous réduisez les temps d'observation, vous augmentez la possibilité que vous devrez réobserver les lignes de base.

  Utilisez des bonnes techniques de levé et effectuez les mesures superflues. Observez les lignes de base critiques deux fois, dans des sessions indépendantes. Créez votre réseau afin que toutes les stations ont au moins trois lignes de base indépendantes attachées. Ainsi, si c'est impossible de résoudre une des observations de lignes de base, vous pouvez toujours calculer les coordonnées de la station sans retourner sur le terrain.

  Structurez votre conception de réseau de façon que des petites figures fermées sont créées des lignes de base observées dans deux ou plusieurs sessions. Ainsi il est assuré que les fermetures de boucle ont une signification. Si toutes les lignes de base dans une boucle sont de la même session, les erreurs de configuration de station qui sont communes à toutes les lignes de base dans cette session ne peuvent pas être détectées.

  Apprenez comment évaluer la sortie du processeur de lignes de base. Un nombre de lignes directrices simples vous aiderez à détecter et évaluer les résultats marginaux. (Une discussion concernant l'évaluation des résultats de traitement se trouve dessous.)

  Utilisez le module d'ajustement de réseau, lorsqu'installé. Vous ne pouvez pas être sûr que votre travail est terminé jusqu'à ce que toutes les lignes de base dans une étude sont rassemblées et ajustées simultanément. Un ajustement de réseau rigoureux est l'outil le plus puissant pour la détection des défauts et des erreurs systématiques dans votre réseau.

Les étapes listées ci-dessus, avec les outils fournis dans le logiciel Trimble Geomatics Office, tels que Recalculer, Fermetures de boucle et le module Ajustement de réseau optionnel, aident à assurer que votre réseau répond aux spécifications requises pour votre projet.

Les rubriques suivantes fournissent des lignes directrices pour le traitement, l'inspection et l'amélioration de la qualité des données GPS:

  Rapport de traitement de lignes de base GPS

  Retraiter les lignes de base problématiques

  Etudier les données avec Timeline

  Corriger les dérapages de cycle

  Corriger les données d'étendue non valide

  Désactiver les observations GPS

  Désactiver les satellites sélectionnés


    Multitrajet

 Vue d'ensemble et plus amples informations

Le multitrajet augmente le temps de voyage du signal de satellite à cause de la réflexion des signaux d'une variété de surfaces. Les sources communes de multitrajet comprennent:

  les masses d'eau

  les bâtiments

  les véhicules

  les clôtures de mailles

Les zones urbaines en particulier peuvent causer des problèmes considérables de multitrajet.

Le Report résiduel affiche le multitrajet sous forme d'une onde sinus sous-jacente dans le report. L'ampleur de l'onde sinus dépend de l'intensité du signal de satellite et la distance entre la source de multitrajet et le centre de phase d'antenne du récepteur. Il est difficile d'identifier le multitrajet avec moins de quinze minutes de données. Si vous suspectez l'existence de multitrajet dans une zone, il faut planifier des temps d'occupation plus longs afin que le processeur de lignes de base obtient une suffisance de données pour égaliser les effets. L'utilisation d'une antenne avec un plan au sol, ou une antenne à choke ring pourrait aider à réduire ces effets.


     Retraitement des lignes de base

Plus amples informations

Comment ...	Voir aussi
Effectuez les étapes suivantes pour retraiter les lignes de base:

1.	Sélectionnez le style de traitement GPS actif à utiliser pour le retraitement.

2.	Pour créer un groupe de sélection des lignes de base à retraiter utilisant toute méthode de sélection standard, effectuez l'une des choses suivantes:

  Cliquez sur une ou plusieurs lignes de base dans la fenêtre de graphiques

  Sélectionnez par interrogation

  Le groupe de sélection précédent

3.	Pour démarrer le processeur, effectuez l'une des choses suivantes:

  Dans le menu Levé, sélectionnez Traiter lignes de base GPS.

  Du groupe de levé Trimble dans la barre du projet, sélectionnez Traiter lignes de base GPS.

  Du groupe Traiter dans la barre du projet, sélectionnez Traiter lignes de base GPS.

Le dialogue Traitement GPS s'affiche et le processeur de lignes de base commence le retraitement de toutes les lignes de base sélectionnées. Utilisez la Liste de traitement GPS pour évaluer les résultats du traitement et décider si vous voulez conserver ou écarter les nouveaux résultats. Vérifier l'état de la case à cocher Ecrasez les solutions de lignes de base en double avant d'enregistrer les nouveaux résultats au projet.

La case à cocher Ecraser les solutions de lignes de base en double contrôle comment les lignes de base sont enregistrées après le retraitement. La case à cocher est sélectionnée par défaut, qui signifie que les solutions existantes sont écrasées. Si la case à cocher est effacée, la nouvelle solution est ajoutée au projet et la solution précédente est conservée. Lorsque ce se produit, la nouvelle solution devient la solution active et la solution précédente devient inactive. La fenêtre Propriétés peut être utilisée pour changer une solution précédente à la solution active à nouveau.

La case à cocher Ecraser les solutions de lignes de base en double ne s'applique qu'aux lignes de base qui sont traitées plus qu'une fois. Il n'a aucun effet sur les lignes de base entre les mêmes deux points qui sont calculés à partir des données GPS collectées à une heure différente ou sur un jour différent. Il est recommandé de toujours écraser les solutions de lignes de base en double.


    Dérapages de cycle

 Vue d'ensemble et plus amples informations

Un dérapage de cycle est une interruption dans la poursuite de satellites continue. Les fronts d'onde que le récepteur compte lors de la poursuite de porteuse continue sont également connus comme les cycles. Donc, lorsque le récepteur perd le compte à cause d'une interruption dans la poursuite de satellites, le cycle ou l'onde se dérape.  Ainsi, un dérapage de cycle causera la remise à zéro de la phase porteuse continue. Ce n'est pas nécessairement une mauvaise situation, à condition que le processeur de lignes de base puisse rétablir le compte au moyen de ses calculs.

Il y a plusieurs choses qui peuvent interrompre le signal de satellite, lorsqu'on est immobile ou mobile. Lorsqu'on est immobile, les dérapages peuvent se produire à cause d'un satellite faible à élévation basse, ou une interruption au signal à cause des obstructions, par exemple des arbres. Lorsqu'on est mobile, il y a beaucoup de choses pouvant causer des dérapages de cycle: le passage sous d'un pont, à travers d'un tunnel ou sous d'un arbre, ou même en mettant votre main sur l'antenne GPS. Il faut faire attention aux situations pouvant causer des dérapages de cycle et de les éviter si possible.


    Rapport de traitement de lignes de base GPS - Résumé de traitement

Cette section du Rapport de traitement de lignes de base GPS vous permet de déterminer rapidement quelles lignes de base nécessitent un examen ultérieur.

Pour accéder au Résumé de traitement, utilisez l'une des méthodes suivantes:

  Dans le dialogue Traitement GPS, double-cliquez sur un résumé de solution à une ligne.

  Sélectionnez une ou plusieurs lignes de base et dans le dialogue Traitement GPS, cliquez sur Rapport.

  Dans la fenêtre de graphiques, sélectionnez les lignes de base et puis sélectionnez Rapports / Rapport de traitement de lignes de base GPS.

Les informations suivantes s'affichent:

Colonne	Indiquant
ID	L'identificateur de ligne de base.
De	Le nom de la station à partir de laquelle l'observation GPS a été effectuée.
Vers	Le nom de la station vers laquelle l'observation GPS a été effectuée
Longueur de ligne de base	La longueur de la ligne de base entre les stations de et vers.
Type de solution	Le type de solution. Les types rapportés les plus communs sont les solutions fixes L1 pour des lignes de base courtes, et les solutions fixes iono libre pour des lignes moyennes. Si vous traitez les lignes de base très longues, des solutions flottantes iono libre peuvent être utilisées.
Ratio	Le processeur de lignes de base effectue une comparaison entre les deux solutions avec la variance la plus basse. Le ratio est la variance de la solution qu'il y a de mieux après divisée par la variance de la meilleure solution.   NOTE: Seules les solutions fixes ont des ratios.
Variance de référence	La variance de référence est un nombre sans unité indiquant avec quel degré du succès les données observées s'adaptent à la solution de lignes de base.
RMS	Le RMS (la moyenne quadratique). Le RMS indique la qualité de la solution basée seulement sur le bruit mesuré des observations de portée de satellite. Il est indépendant de la géométrie des satellites.


Rapport de traitement de lignes de base GPS - Résumé de ligne de base

Cette section du Rapport de traitement de lignes de base GPS affiche les informations de résumé pour une ligne de base spécifiée. Pour étudier cette ligne de base:

1.	Sélectionnez Rapports / Rapport de traitement de lignes de base GPS. Le Rapport de traitement de lignes de base s'affiche.

2.	Sélectionnez la ligne de base du Résumé de traitement.

Les informations suivantes s'affichent:

Champ	Indiquant
Traité	Le jour, la date, et l'heure auxquels la solution a été traitée.
Type de solution	Les types rapportés les plus communs sont les solutions fixes L1 pour des lignes de base courtes, et les solutions fixes iono libre pour des lignes moyennes. Si vous traitez les lignes de base très longues, des solutions flottantes iono libre peuvent être utilisées.
Acceptabilité de solution	Si la solution a réussie aux critères d'acceptance configurés dans le dialogue Styles de traitement GPS.
Ephéméride utilisée	Si une éphéméride diffusée ou précise a été utilisée lors de la détermination de la solution de ligne de base.
Données met	Le modèle météorologique utilisé.
Distance inclinée de ligne de base	La distance inclinée de la ligne de base.
Masque d'élévation	Le masque d'élévation configuré pendant le traitement. Cette valeur est configurée dans le dialogue Styles de traitement GPS.
Ratio de variance	Le processeur de lignes de base effectue une comparaison entre les deux solutions avec la variance la plus basse. Le ratio est la variance de la solution qu'il y a de mieux après divisée par la variance de la meilleure solution.   NOTE: Seules les solutions fixes ont des ratios.
Variance de référence	La variance de référence est un nombre sans unité indiquant avec quel degré du succès les données observées s'adaptent à la solution de lignes de base.
RMS	Le RMS (la moyenne quadratique). Le RMS  indique la qualité de la solution basée seulement sur le bruit mesuré des observations de portée de satellite. Il est indépendant de la géométrie des satellites.
Précision horizontale	La précision horizontale de l'observation.
Précision verticale	La précision verticale de l'observation.
Heure de début (Heure GPS)	L'heure de début de l'observation GPS.
Heure d'arrêt (Heure GPS)	L'heure d'arrêt de l'observation GPS.
Temps d'occupation	La durée de l'occupation; c'est à dire, la différence entre l'heure de début et l'heure d'arrêt de l'observation GPS.


Rapport de traitement de lignes de base GPS  - Composants de ligne de base

Cette section du Rapport de traitement de lignes de base GPS affiche les coordonnées de deux points mesurés lors de l'occupation. Les composants de ligne de base entre les deux points, les erreurs standard et la matrice de covariance a posteriori sont affichées aussi.

Pour accéder à la section Composants de ligne de base:

1.	Sélectionnez Rapports / Rapport de traitement de lignes de base GPS. Le Rapport de traitement de lignes de base s'affiche.

2.	Sélectionnez la ligne de base du Résumé de traitement. Le Résumé de ligne de base s'affiche.

3.	Du Contenu, sélectionnez Composants de ligne de base.

Les coordonnées pour chaque point s'affichent; c'est à dire les coordonnées de grille, locales et WGS-84.

Les champs suivants sont indiqués dans la table de Composants de ligne de base:

  Delta nord, est, et élévation

  Azimut avant section normale

  Distance d'ellipsoïde

  Hauteur delta

  Delta X, Y et Z

Les champs suivants sont indiqués dans la table d'Erreurs standard:

  σ Nord, σ Est, σ Elévation

  σ Azimut section normale

  σ Distance d'ellipsoïde

  σ Hauteur delta

  σX, σY, σZ

Les informations de covariance sont indiquées dans la table de Matrice de covariance a posteriori.


Rapport de traitement de lignes de base GPS - Occupations

Cette section du Rapport de traitement de lignes de base GPS affiche les détails concernant le récepteur GPS et l'antenne utilisés pour observer les points dans le levé.

Pour accéder à la section Occupations:

1.	Sélectionnez Rapports / Rapport de traitement de lignes de base GPS. Le Rapport de traitement de lignes de base GPS s'affiche.

2.	Sélectionnez la ligne de base du Résumé de traitement. Le Résumé de ligne de base s'affiche.

3. 	Du Contenu, sélectionnez Occupations.

Les informations suivantes s'affichent:

Champ	Indiquant
Nom du point	Les noms des points occupés avec le récepteur GPS.
Fichier de données	Les noms de fichier (fichiers .dat) utilisés pour stocker les données aux points de et vers.
Type de récepteur	Les types de récepteur GPS utilisés dans les observations.
N. de série du récepteur	Le numéro de série du récepteur GPS.
Type d'antenne	Le type d'antenne GPS.
Mesuré à	Le point sur l'antenne GPS auquel on a mesuré lors de la détermination de la hauteur de l'antenne.
Hauteur d'antenne	La hauteur de l'antenne GPS mesurée et la hauteur de l'antenne au Centre de phase d'antenne (APC). NOTE: La valeur APC est calculée selon le type d'antenne.
Modèle d'antenne	Le modèle de l'antenne GPS.


Rapport de traitement GPS - Style de traitement

Cette section du Rapport de traitement de lignes de base fournit un résumé des contrôles utilisés dans le traitement. Ces contrôles sont configurés dans le dialogue Styles de traitement GPS. Vous devez vérifier que les paramètres corrects sont utilisés dans votre traitement de lignes de base.

Pour accéder à la section Style de traitement:

1.	Sélectionnez Rapports / Rapport de traitement de lignes de base GPS. Le Rapport de traitement de lignes de base GPS s'affiche.

2.	Sélectionnez la ligne de base du Résumé de traitement. Le Résumé de ligne de base s'affiche.

3. 	Du Contenu, sélectionnez Style de traitement.

Les champs suivants s'affichent:

Section	Champs
Style de traitement − affiche le nom du style de traitement utilisé.	Masque d'élévation Type d'éphéméride Type de solution
Statique − affiche les contrôles du processeur statique.	Temps d'observation de ligne de base minimum Longueur maximum de ligne de base pour essayer une solution fixe—deux configurations s'affichent; une pour l'utilisation de l'éphéméride diffusée et l'autre pour l'utilisation de l'éphéméride précise.
Cinématique − affiche les contrôles du processeur cinématique.	Temps d'observation de référence minimum Temps d'observation d'initialisation statique minimum Ratio minimum d'initialisation de point connu: Temps minimum de traitement OTF
Global − affiche la configuration globale faite dans la tabulation configuration globale.	Type de fréquence Dérapage maximum de cycle fixable (traitement statique seulement)  Itérations maximum (traitement statique seulement) Temps de recherche maximum de nombre entier (traitement statique seulement)
Qualité	Critère d'acceptance RMS Critères d'acceptance de ratio Critères d'acceptance de variance de référence Multiplicateur d'édition
Tropo	Modèle Intervalle de délai de zénith minimum Utiliser données de met observées
Iono	Passe de résolution d'ambiguïté (traitement statique seulement) Passe finale
Evénements	Méthode d'interpolation Nombre de points à ajuster  Epoques manquantes maximum permises Décalage d'heure NOTE: Vous pouvez les données d'événement dans la fenêtre de Propriétés.
Recherche OTF – affiche la méthode utilisées pour les recherches OTF (en vol)


    Rapport de traitement de lignes de base GPS - Résumé de poursuite

Le Rapport de traitement de lignes de base comprend les résumés de poursuite de satellite à chaque point, et aussi un résumé de poursuite combiné.

Pour accéder à la section de Résumés de poursuite:

1.	Sélectionnez Rapports / Rapport de traitement de lignes de base GPS. Le Rapport de traitement de lignes de base GPS s'affiche.

2.	Sélectionnez la ligne de base dans le Résumé de traitement. Le Résumé de ligne de base s'affiche.

3. 	Du Contenu, sélectionnez Résumé de poursuite.

Résumés de point individuels

Ces résumés indiquent la qualité de la poursuite des signaux L1 et L2 reçus de chaque satellite.

Les résumés de poursuite de satellite indiquent la continuité de poursuite de satellite à la station de référence ainsi qu'à la station mobile. Les résumés indiquent la poursuite continue pendant la session d'observation utilisant des lignes solides continues pour chaque satellite à chaque station.

Utilisez les résumés pour déterminer l'ampleur et le nombre de dérapages de cycle (perte de contact) que se produisent.  Les dérapages de cycle sur un satellite sont indiqués par des écarts et des intervalles dans les données. Après un dérapage de cycle, des coches indiquent le moment que le récepteur reprend le signal de satellite à nouveau.

Résumé combiné

Du fait que le traitement de lignes de base nécessite la poursuite simultanée du même satellite à chaque station, le Rapport de traitement de lignes de base GPS également comprend un report de la poursuite combinée.

Les segments utilisés dans le traitement sont affichés sous forme des cases grises autour du signal. S'il y a un écart dans le Segments de phase traités, le processeur de lignes de base n'a pas utilisé ce segments de données pour traiter la ligne de base.


    Rapport de traitement de lignes de base GPS -  Qualité cinématique continu

Plus amples informations

Comment ...	Rapport	Voir aussi

Cette section est comprise seulement après le traitement des données cinématique continu. La section Qualité cinématique continu contient deux reports.

Pour accéder aux informations de qualité cinématique continu:

1.	Sélectionnez Rapports \ Rapport de traitement de lignes de base GPS. Le Rapport de traitement de lignes de base GPS s'affiche.

2.	Sélectionnez la ligne de base du Résumé de traitement. Le Résumé de ligne de base s'affiche.

3. 	Du Contenu, sélectionnez Qualité cinématique continu.

Le première est un report du RMS de chaque ligne de base cinématique continu tracée contre le temps. Il peut être utilisé pour identifier le temps pendant lequel des mauvais résultats peuvent être présents. Une augmentation constante du RMS pendant le temps peut également indiquer que des problèmes se sont produits lors de traitement.

Le deuxième est un report du RDOP et le nombre de SVs contre le temps. Ce report est utilisé pour identifier les temps pendant les quels il se peut qu'il y avait une mauvaise géométrie de satellite, et donc des mauvais résultats de traitement.


    Rapport de traitement de lignes de base - Résiduels

Les reports résiduels sont une représentation graphique des résiduels d'observation de chaque satellite utilisé dans la solution de lignes de base.

Les reports résiduels indique la qualité des données reçues de chaque satellite. Vous pouvez utiliser ce report pour obtenir une idée de la quantité de bruit dans la solution. Ce report affiche les résiduels de chaque satellite pour chaque cycle de mesure.  Des satellites brumeux peuvent avoir un effet sur les données provenant d'autres satellites. Les lignes sur le graphique devraient être centrées près de zéro. La quantité de bruit dans la solution est indiquées par la variation du report de zéro.

Les résiduels ne sont pas affichés pour le satellite choisi par le processeur comme la base pour la  double différence. Pour les occupations plus longues, le processeur peut choisir plus d'un satellite pour ce but. En général, les écarts dans le report résiduel signifient que, pendant cette période de temps, le satellite a été utilisé comme la base pour la double différence.


    Solutions L1 seul contre iono libre

La solution Iono libre fixe est la solution optimum sous les conditions les plus variées. Ces solutions ne contiennent aucun déviation ionosphérique, et des ambiguïtés fixes produisent les meilleurs résultats généraux.

Cependant une solution Iono libre fixe sur des lignes de base courtes peut être une faible solution. Il faut éviter l'utilisation de telles solutions pour des lignes de base courtes. Le logiciel Trimble Geomatics Office identifie automatiquement les lignes de base courtes et sélectionnes le type de solution finale appropriée.

Une solution Iono libre flottante sur les lignes de base dépassant 30 kilomètres peut être une très bonne solution, mais assurez-vous de la vérifier. Sur des lignes de base très longues, il se peut que la solution Iono libre flottante est la meilleure que vous pouvez obtenir. Les temps d'occupation plus longs produisent des meilleures solutions Iono libre flottante car l'observable sans déviation permet la solution de converger sur le résultat géométrique correct. En fait, les solutions Iono libre flottante sur des lignes très longues, occupées pour plusieurs heures, peuvent produire des résultats excellents.

Pour les lignes de base très courtes (moins de 5 kilomètres), une passe finale L1 seul (dérivée des ambiguïtés à bi-fréquence) est la solution finale en générale; pour les lignes de base très longues (dépassant 200 kilomètres utilisant l'éphéméride diffusée, 2000 kilomètres utilisant l'éphéméride précise) une passe finale Iono libre flottante peut être la solution finale, comme suit:

Lignes de base très courtes

Pour les lignes de base courtes de quelques kilomètres de longueur, une passe finale L1 seul est générée au lieu de Iono libre fixe. Cette solution L1 seul, cependant, est générée utilisant les données à bi-fréquence pour aider la dérivation des ambiguïtés L1. Pour les lignes de base comprises dans une étendue de 5 kilomètres ou moins, la solution L1 fixe est en général préférable car il y a moins de bruit dans la solution.

La valeur utilisée comme le seuil pour les solutions L1 seul peuvent être configurée à l'aide des Styles de traitement GPS.

Lignes de base très longues

Pour les lignes de base très longues (plusieurs centaines à plusieurs milles de kilomètres) sélectionnez un type de solution flottante pour générer une solution Iono libre flottante utilisant les données à bi-fréquence. Comme mentionné ci-dessus, les temps d'occupation longs sur des lignes très longues peuvent produire des solutions Iono libre flottante excellentes.

La valeur utilisée comme le seuil des solutions flottantes pour les lignes de base très longues peut être configurée utilisant les style de traitement GPS. Des critères séparés peuvent être configurés pour l'utilisation des éphémérides diffusées et précises.


    Solutions flottantes

Plus amples informations

Comment ...	Rapport	Voir aussi

Lors du traitement des données à monofréquence, le processeur de lignes de base génère une solution de passe finale L1 Fixe si les ambiguïtés L1 peuvent être déterminées avec succès. Si la recherche L1 ne réussit pas, cependant, une solution L1 Flottant est générée. Une solution L1 flottant pour une ligne très courte peut se produire à cause d'une occupation trop courte ou des observations anormalement bruyantes. Pour les lignes de base de 10 à 15 kilomètres ou plus, il peut devenir de plus en plus difficile à obtenir des solutions L1 fixe fiables à cause de la sensibilité des observations à monofréquence aux délais ionosphériques.

En général les solutions L1 flottant sont plus faibles que les solutions de nombre entier. Pour les applications standard il est recommandé d'éviter l'utilisation des solutions L1 flottant. Vous devriez retraiter vos données ou réobserver ces lignes de base sur le terrain.

La décision de produire une solution de nombre entier est contrôlé par le seuil de ratio spécifié internement par le processeur de lignes de base. Le seuil est configuré sur 1,5. Lorsque le ratio calculé est moins de ce seuil de ratio, des solutions flottantes sont produites.


    Dialogue Configuration du rapport de traitement de lignes de base GPS

Plus amples informations

Comment...	Voir aussi

Utilisez ce dialogue pour sélectionner les sections qui s'affichent dans le Rapport de traitement de lignes de base GPS.

Pour y accéder, effectuez l'une des choses suivantes:

  Sélectionnez Rapports / Configuration / Rapport de traitement de lignes de base  GPS.

  Appuyez sur Alt+RSO.

Le dialogue Configuration du rapport de traitement de lignes de base GPS s'affiche.

Des cases à cocher sont fournies pour l'ajout ou la suppression des sections du rapport suivantes:

  Résumé

  Composants de ligne de base

  Occupations

  Style de traitement

  Résumés de poursuite de station

  Qualité cinématique continu

  Résiduels


    Carnets de terrain (*.dc) Trimble

Typiquement ces fichiers contiennent des informations obtenues lors des levés cinématique en temps réel (RTK) ou conventionnels. Les fichiers de carnet de terrain de Trimble peuvent être utilisés pour référencer des mesures GPS utilisées pour le post traitement lorsqu'une communication radio n'est pas possible. Dans ce cas les informations de point sont stockées dans le fichier de carnet de terrain et les mesures GPS brutes sont stockées dans un fichier .dat  relatif pour un traitement ultérieur. Les mesures GPS référencées par le fichier de carnet de terrain sont utilisées par le processeur de lignes de base dans le logiciel Trimble Geomatics Office pour calculer les lignes de base qu'il n'était pas possible de résoudre en temps réel.

Bien que les mesures GPS soient stockées dans des fichiers .dat séparés, elles peuvent être chargées automatiquement par le procédé d'importation grâce aux références dans le fichier de carnet de terrain même. Il n'est pas nécessaire de les charger comme fichiers indépendants.

Les fichiers de carnet de terrain peuvent comprendre des mesures collectées pendant plusieurs sessions de levé, chacune collectée en utilisant des méthodes de levé différentes.


    Récepteurs (*.dat) Trimble

Ces fichiers contiennent des mesures obtenues par un récepteur GPS Trimble. Typiquement ces fichiers sont enregistrés au tableau de mémoire du récepteur, ou à une carte de mémoire dans un carnet de terrain Trimble. Les fichiers sont téléchargés d'un périphérique de levé au logiciel Trimble Geomatics Office pour être traités. Les mesures contenues dans ces fichiers sont utilisées par le processeur pour calculer des lignes de base utilisant les techniques cinématique, statique et statique rapide.


    Autres fabricants de récepteurs

Plus amples informations

 Voir aussi

Ces fichiers contiennent des mesures obtenues par un récepteur GPS. En ce qui concerne le contenu, ils sont semblables aux fichiers .dat, mais ils sont stockés sous le format Receiver INdependent EXchange format (RINEX). Le format RINEX est une représentation ASCII des données GPS collectées par les récepteurs. Les fichiers RINEX comprennent des données d'observation, de navigation et météorologiques.

Typiquement les fichiers RINEX sont obtenus des stations de base, par l'IGS Tracking Network, Continuously Operating Reference Stations (CORS) aux Etats-Unis, ou des logiciels d'autres. Le processeur utilise ces fichiers dans la même façon que les fichiers .dat pour obtenir des solutions de ligne de base à vecteur.


    Données GPS statique/statique rapide

Plus amples informations

 Voir aussi

Les différences suivantes existent entre les données collectées lors d'une session de levé statique et une session de levé statique rapide .

Pour les sessions statiques, on suppose que le récepteur:

  reste immobile sur un seul point

  collecte les données pendant une période plus longue que celle de statique rapide.

Pour les sessions statique rapide, on suppose que le récepteur:

  se déplace à plusieurs points et reste immobile lors de la collecte de données à chaque point, et

  ne collecte pas les données lorsque le récepteur se déplace d'un point à un autre, et

  collecte les données pendant une période plus courte que celle d'une session statique

La différence la plus importante entre statique et statique rapide est le temps minimum requis pour l'enregistrement des données par le récepteur (le temps d'occupation). Ce temps dépend de votre application, la longueur de la ligne de base , et si vous utilisez un récepteur à monofréquence ou bifréquence.

Les temps d'occupation statique peuvent durer de 30 minutes jusqu'à plusieurs heures pour des applications nécessitant les plus hauts niveaux de précision et de répétition. Les temps d'occupation statique rapide sont d'environ 8 minutes pour des levés effectués avec des récepteurs à monofréquence, mais ils peuvent durer de plus selon les conditions locales.

En général, les lignes de base plus longues nécessitent des temps d'occupation plus longs. Avec une augmentation du temps d'occupation, il y a une confiance plus grande dans le résultat calculé. Le temps requis de rester sur la station dépend de la constellation de satellites. Le temps d'occupation diminue lorsque le nombre de satellites visibles augmente. Les temps d'occupation dépendent également de la longueur de la ligne de base observée. Les lignes de base plus longues, en générale, nécessitent des temps d'occupation plus longs, indifférent à la constellation de satellites.

Les méthodes de levé statique et statique rapide offrent les précisions GPS les plus hautes possibles. En général, les meilleurs résultats sont obtenus lorsque vous programmez d'avance à utiliser des sessions de collecte de données statique et statique rapide conjointement l'une avec l'autre.


    Données cinématiques

Plus amples informations

 Voir aussi

La différence entre une session de levé cinématique et les sessions statique ou statique rapide est l'action mobile du récepteur lors de la collecte des données; en général les récepteurs ne restent pas immobiles lors de la collecte des données cinématiques.

Une autre différence importante entre les méthodes de levé cinématique et statique/statique rapide est le temps d'occupation. Dans les levés cinématique, le temps d'occupation de la station est réduit de façon dramatique (après l'initialisation). Il peut varier de minutes jusqu'aux secondes, selon l'application. Ce permet un levé hautement productif; beaucoup de points de données peuvent être collectés pendant une période de temps courte.

Néanmoins, cette productivité augmentée a un inconvénient: les précisions réalisables sont plus basses que celles des méthodes statique/statique rapide  et les temps d'occupation plus courts sont plus susceptibles à multitrajet à cause de la quantité de données plus petite. Les précisions associées aux levés cinématiques limitent son utilisation aux applications GPS dans lesquelles une haute précision n'est pas requise.

Les levés cinématiques nécessitent une étape d'initialisation pour résoudre l'ambiguïté de nombre entier inconnu dans le signal GPS lors de l'acquisition du contact avec le satellite.  Cette ambiguïté doit être résolue pendant le traitement afin d'obtenir les résultats à haute précision requis par les applications de levé.

Une fois que l'initialisation se produit, vous pouvez utiliser des occupations courtes aux points de levé. Le logiciel Trimble Geomatics Office peut appliquer l'initialisation aux solutions subséquentes. Donc, une fois que l'initialisation se produit il ne vous faut qu'un temps d'occupation avec une suffisance de données pour obtenir la nouvelle position.

Quatre types d'initialisation existent:

  Point connu

  Statique

  Post-traitée en vol (OTF)

  Réoccupation


    Initialisation statique

Plus amples informations

 Voir aussi

L'initialisation statique nécessite que le récepteur de base occupe un point de référence connu pendant que le mobile occupe tout autre point. Le mobile reste immobile sur son point pour la période de temps requise pour une occupation Statique rapide normale. Le temps d'occupation variera selon le nombre de satellites disponibles et le type de récepteurs utilisés dans le levé. Considérez les recommandations de temps d'occupation statique rapide et votre propre expérience basée sur la disponibilité des satellites et les conditions locales.


    Initialisation par point connu

Plus amples informations

 Voir aussi

L'initialisation par point connu est le type le plus rapide et le plus fiable de tous les types d'initialisation. Les récepteurs de base et mobile sont installés sur les points connus ou relevés précédemment, et le mobile reste immobile pendant au moins 30 secondes sur son point. Le processeur de lignes de base utilise les coordonnées connues comme d'informations supplémentaires pendant l'initialisation.


    Initialisation post-traitée en vol (OTF)

Plus amples informations

 Voir aussi

L'initialisation OTF nécessite le maintien du contact avec cinq satellites. Le récepteur de base est positionné sur un point connu et collecte les mesures GPS. Le mobile collecte les mesures pour la même période de temps, mais il n'est pas nécessaire que le mobile reste immobile sur tout point pour une période de temps spécifiée. Le processeur de lignes de base peut utiliser ces données pour l'initialisation, même si le mobile était en mouvement pendant le temps entier de la collecte de données.


    Initialisation par réoccupation

Plus amples informations

 Voir aussi

L'initialisation par réoccupation est semblable à l'initialisation par point connu, mais le point occupé par le mobile n'est pas connu d'avance. Plutôt le mobile occupe un point précédemment occupé pendant la même session cinématique sur le terrain. Il est supposé que le processeur de lignes de base pourra résoudre la ligne de base de la base au mobile pour l'occupation précédente du même point. Si c'est vrai, cette solution de ligne de base précédente peut être utilisée plus tard pour l'initialisation. Le mobile doit rester immobile sur le point occupé précédemment pendant au moins 30 secondes.


    Données cinématique continu et mobile

Plus amples informations

 Voir aussi

Les levés cinématique continu vous permettent d'effectuer ces opérations:

  Tracer des caractéristiques topographiques, tels que les profils, les profiles en travers et les courbes de niveau.

  Tracer les routes des véhicules en marche, tels que les avions ou les navires, et également déterminer les coordonnées des événements instantanés, tel que l'ouverture de l'obturateur d'un appareil photographique. Les événements sont générés dans le récepteur par l'envoi d'un signal au port d'événement du récepteur, que provoque le stockage d'un indicateur d'événement.

Les levé cinématique continu ont les mêmes restrictions que les levés cinématiques d'Arrêt et Début. Dans les levés Cinématique continu, cependant, le processeur de lignes de base peut résoudre pour chaque position de récepteur non seulement lorsqu'il est immobile mais aussi pour chaque observation GPS effectuée lorsque le mobile se déplace. Les levés topographiques, par exemple, peuvent être exécutés par l'enregistrement de données continûment sur une surface de projet, à condition que vous faites attention aux hauteurs d'antenne.

Du fait que les levés Cinématique continu fournissent une position pour le récepteur à chaque époque, une telle instance est un indicateur d'événement. Pour ce faire le processeur de lignes de base utilise une ou plusieurs positions de chaque côté de l'événement avec une stratégie d'interpolation pour déterminer la position du récepteur à une instance de temps spécifique.  Les styles de traitement GPS peuvent être utilisés pour contrôler l'interpolation d'événement utilisant:

  Méthode d'interpolation

  Epoques manquants maximum permis

  Décalage d'heure

NOTE: Le processeur de lignes de base assigne automatiquement les noms de point à tous les points continus. Ce se fait afin d'assurer qu'il n'y a aucun conflit avec des points obtenus en utilisant les techniques continues RTK .


     Commande Nouveau report (Report SV)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour ouvrir une nouvelle fenêtre Report SV. Il est possible d'ouvrir, de faire un mosaïque et de faire une cascade des fenêtres multiples Report SV. Les fenêtres Report SV individuelles peuvent être minimisées et leurs icônes peuvent être organisées dans la zone client du Report SV.

Pour  y accéder, effectuez l'une des choses suivantes dans la fenêtre Reports de signal GPS:

  Sélectionnez Fichier / Nouveau report.

  Dans la barre d'outils Report SV, cliquez sur [image].

Une nouvelle fenêtre de client s'affiche. Vous pouvez l'utiliser pour afficher des reports supplémentaires.


     Commande Exporter (Report SV)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour exporter les données de poursuite de satellite brutes pour le report actif au fichier. La table de données dans le fichier comprend une colonne pour chaque type d'informations de poursuite de satellite brutes compris dans le report actif.

Pour y accéder, effectuez l'une des choses suivantes dans la fenêtre Reports de signal GPS:

  Sélectionnez Fichier / Exporter.

  Dans la  barre d'outils Report SV, cliquez sur [image].

Les fichiers Report SV exportés sont enregistrés aux fichiers texte (fichiers *txt).


     Commande Imprimer (Report SV)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour imprimer le report affiché dans la fenêtre Report SV sélectionnée actuellement. Le report peut être sorti vers une imprimante ou un fichier, selon les options sélectionnées dans le dialogue Imprimer.

Pour y accéder, effectuez l'une des choses suivantes dans la fenêtre Reports de signal GPS:

  Sélectionnez Fichier / Imprimer.

  Dans la barre d'outils Report SV, cliquez sur [image].

Le dialogue Imprimer s'affiche, avec les options pour la sélection d'options d'impression.

Considérez ces options:

  Vous pouvez cliquez sur OK pour imprimer les reports dans la fenêtre active immédiatement en mode portrait.

  Choisissez l'option Paysage pour tourner le report par 90 degrés sur la page imprimée.

  Choisissez l'option Fichier pour transférer les reports dans la fenêtre active vers un fichier imprimante. Si vous choisissez l'option Fichier et cliquez sur OK, un dialogue s'affichera pour demander le nom du fichier.

  Vous pouvez également transférer les informations de satellite brutes utilisées pour générer les reports vers un fichier en utilisant la commande Exporter. Ce sert à la documentation des informations de poursuite de satellites brutes en forme tabulaire. Plus tard, vous pouvez combiner les informations tabulaires exportées et les reports sous forme de rapports.


     Commande Aide de report SV (Report SV)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour afficher des informations de l'aide à propos des commandes et des opérations Report SV.

Pour y accéder, effectuez l'une des choses suivantes dans la fenêtre Reports de signal GPS:

  Sélectionnez Aide / Aide de report SV.

  Dans la barre d'outils Report SV, cliquez sur [image].

L'Aide de report SV s'affiche.


     Intervalle F L1 (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer des données Intervalle fixe L1 (Intervalle F), sous forme de mètres, pour le satellite sélectionné pendant la période de la ligne de temps.

Pour y accéder, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / Intervalle F L1.

  Dans la barre de dialogue, cliquez sur Intervalle F L1.

Les informations de l'Intervalle F l1 sont tracées dans la fenêtre active.


     Commande Azimut (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les données d'azimut, sous forme de degrés, collectées pour le satellite sélectionné pendant la période de la ligne de temps.

Pour afficher le report d'Azimut, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / Azimut.

  Sur la barre de dialogue, cliquez sur Azimut.


     Commande Elévation (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer des informations de l'élévation de satellite brutes. Les données sont tracées sous forme de degrés pendant la période de la ligne de temps.

Pour afficher le report d'Elévation, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / Elévation.

  Sur la barre de dialogue, cliquez sur Elévation.

Les données d'élévation sont tracées dans la fenêtre active.


     Commande SNR L1 (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les données de rapport signal/bruit (SNR) de la fréquence L1, collectées pour le satellite sélectionné pendant la période de la ligne de temps.

Pour afficher le report SNR L1, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / SNR L1

  Sur la barre de dialogue, cliquez sur SNR L1.

Les informations de rapport signal/bruit L1sont tracées dans la fenêtre active.


     Commande SNR L2 (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les données de rapport signal/bruit de la fréquence L2, collectées pour le satellite sélectionné pendant la période de la ligne de temps.

Pour y accéder, effectuez l'une de ces actions dans la fenêtre Reports de signal GPS:

  Sélectionnez Affichage / Données / SNR L2.

  Sur la barre de dialogue, cliquez sur SNR L2.

Les informations de rapport signal/bruit L1sont tracées dans la fenêtre active.


     Commande Phase L1 (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les données de phase porteuse L1 collectées pour le satellite sélectionné pendant la période de la ligne de temps.

Pour afficher le report de Phase L1, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / Phase L1.

  Sur la barre de dialogue, cliquez sur Phase L1.

Les informations de phase L1 sont tracées dans la fenêtre active.


     Commande Phase L2 (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les données de phase porteuse L2 collectées pour le satellite sélectionné pendant la période de la ligne de temps.

Pour afficher le report de Phase L2, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / Phase L2.

  Sur la barre de dialogue, cliquez sur Phase L2.

Les informations de phase L2 sont tracées dans la fenêtre active.


     Commande L1 Doppler (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour afficher les données de Doppler L1, en kHz, collectées pour le satellite sélectionné pendant la période de la ligne de temps.

Le L1 Doppler est le décalage de la fréquence du signal porteur apparent en moyenne sur un intervalle de mesure représentatif. Il est mesuré par rapport à la fréquence de porteuse L1 de 1575.42 MHz, référencée à l'horloge interne du récepteur. Le L1 Doppler comprend toutes les erreurs de fréquence de l'horloge de satellite et de récepteur. Il est exprimé en Hertz à la porteuse L1.

Pour afficher le report L1 Doppler, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / L1 Doppler.

  Sur la barre de dialogue, cliquez sur L1 Doppler.

Les informations L1 Doppler sont tracées dans la fenêtre active.


     Commande L1 Aux CA (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les informations de code C/A auxiliaire L1 collectées pour le satellite sélectionné pendant la période de la ligne de temps. Les options de menu et les boutons de la barre de dialogues de la commande ne sont pas disponibles lorsqu'aucune information C/A auxiliaire L1 n'a été collectée pour le satellite. Ce code n'est disponible qu'aux récepteurs ayant la capacité de poursuivre le code C/A L1 et le code P L1 simultanément.

Pour afficher les informations de code C/A auxiliaire L1, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / L1 Aux. CA.

  Sur la barre de dialogue, cliquez sur L1 Aux. CA.

Les informations C/A auxiliaire sont tracées dans la fenêtre active.


     Commande Décalage d'horloge (Report SV)

Plus amples informations

Comment ...	Voir aussi

Sélectionnez cette commande pour tracer les informations de décalage d'horloge, en millisecondes, pendant la période de la ligne de temps.

Pour afficher le report du Décalage d'horloge, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Données / Décalage d'horloge.

  Sur la barre de dialogue, cliquez sur Décalage d'horloge.

Les données de Décalage d'horloge sont tracées dans la fenêtre active.


     Commande Barre de dialogue (Report SV)

Plus amples information

Comment ...	Voir aussi

Sélectionnez commande pour afficher ou masquer la barre de dialogue. La barre de dialogue comprend toutes les commandes pour le traçage des informations brutes de poursuite de satellites.

Pour afficher ou masquer la barre de dialogue:

  Sélectionnez Affichage / Barre de dialogue.

  Appuyez sur Alt+VD.

Les boutons de barre de dialogue suivants sont disponibles:

  Azimut

  Elévation

  Intervalle L1

  S/N L1

  S/N L2

  Phase L1

  Phase L2

  L1 Doppler

  L1 Aux. CA

  Décalage d'horloge

NOTE:  Ces boutons sont les mêmes que la commande sur le menu Report SV.

ASTUCE: Vous pouvez changer la position de la barre de dialogue. Vous pouvez la mettre à côté de la barre d'outils Report SV ou au-dessous de la barre d'état.


     Commande Barre d'outils

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour afficher ou masquer la barre d'outils Report SV.

Pour afficher ou masquer la barre d'outils Report SV:

  Sélectionnez Affichage / Barre d'outils.

  Appuyez sur Alt+VT.

La barre d'outils est affichée ou masquée à chaque fois que vous sélectionnez cette commande.


     Commande Données (Report SV)

Plus amples informations

Comment ...	Voie aussi

Sélectionnez cette commande pour un sous-menu des commandes de traçage. Les commandes individuelles tracent un type spécifique d'informations brutes de poursuite de satellites.

Pour afficher le sous-menu Données:

  Sélectionnez Affichage / Données

Un sous-menu s'affiche avec les commandes suivantes:

  Azimut

  Elévation

  Intervalle L1

  S/N L1

  S/N L2

  Phase L1

  Phase L2

  L1 Doppler

  L1 Aux. CA

  Décalage d'horloge

NOTE:  Ces commandes sont les mêmes que les boutons de commande sur la barre de dialogue Report SV.


     Commande Quitter (Report SV)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour terminer la session d'affichage du Report SV.

Pour sélectionner la commande Quitter, effectuez l'une des choses suivantes:

  Sélectionnez Fichier / Quitter.

Le Report SV se ferme.


     Commande Utiliser l'aide (Report SV)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour afficher le système d'aide Windows à propos d'Utiliser l'aide.

Pour afficher le système d'aide Windows à propos d'Utiliser l'aide, effectuez l'une des choses suivantes::

  Sélectionnez Aide / Utiliser l'aide.

Le système d'aide Windows à propos d'Utiliser l'aide s'affiche.


     Commande Index (Report SV)

Sélectionnez cette commande pour démarrer le système d'aide du logiciel Trimble Geomatics Office.

Pour afficher l'Aide de Trimble Geomatics Office, effectuez l'une des choses suivantes:

  Sélectionnez Aide / Index.

La première rubrique du système d'aide s'affiche.


     Impression des reports

Il est possible de sortir l'image graphique d'un report vers une imprimante ou un fichier imprimante.

Les reports sont imprimés en mode Portrait par défaut. Vous pouvez sélectionner Paysage du dialogue Config. d'impression afin de faire tourner les report de 90 degrés.

ASTUCE: Vous pouvez également exporter les données de poursuite de satellites associées avec un report vers un fichier, ouvrir le fichier dans un éditeur texte, et imprimer les données.  Ce peut servir afin de documenter les reports imprimés.


     Exportation des données de report

Les groupes de données de poursuite de satellites peuvent être affichés dans une fenêtre de report et exportés vers un fichier.

Ce qui suit est un extrait des premières lignes d'un fichier contenant les données de report Rapport signal/bruit L1 et L2:

Exportation des données de satellite Timeline pour le satellite SV 1 dans le fichier 29932370.DAT

Heure                       	       S/N L1   S/N L2

14:05:25.0  1998/09/10       52.75     38.00

14:05:25.0  1998/09/10       52.75     38.00

NOTE: Des colonnes supplémentaires sont ajoutées aux fichiers exportés lorsqu'il y a plus de types de données compris dans la même fenêtre de report.


     Analyse des reports

Plus amples informations

 Voir aussi

Il est possible d'analyser les reports de poursuite de satellites, affichés dans une ou plusieurs fenêtres Report SV, afin de trouver des désaccords. Ce peut servir à identifier tout problème rencontré chez un récepteur dans la poursuite d'un ou plusieurs satellites.  Dans certains cas ce peut aider à désactiver toutes, ou une partie, des mesures d'un ou plusieurs satellites.


     Affichage des reports SV

Plus amples informations

 Voir aussi

Il est possible d'afficher les reports des données de poursuite de satellites collectées en utilisant les commandes de la barre de dialogue ou du menu.

Vous pouvez faire les choses suivantes lors de l'affichage des reports:

  Afficher des types multiples de données de poursuite de satellites collectées dans la même fenêtre.

  Ouvrir les fenêtres multiples, chacune affichant un ou plusieurs types de données de poursuite de satellites collectées.

  Utiliser la souris pour pointer aux zones de données d'un report, et lire les indicateurs de la barre d'état afin de vous informer de la valeur et l'heure de collecte des données.

  Analyser visuellement deux ou plusieurs types de données de poursuite collectées afin de rechercher tout désaccord.

  Afficher les fenêtres en mode mosaïque ou cascade.

  Réduire et agrandir les fenêtres.

  Organiser les icônes de fenêtres réduites.

  Redimensionner, déplacer, et restaurer les fenêtres en utilisant les commandes standard de Windows.

  Fermer les fenêtres de client à tout moment.

  Réduire et agrandir la fenêtre Report SV.  Lorsque réduite, l'icône s'affiche dans la barre de tâches de Windows.


     Report SV - Vue d'ensemble

Affichez Report SV pour analyser les reports des informations brutes de poursuite de satellite collectées pour un satellite sélectionné dans Timeline.

La fenêtre d'application peut être réduite, agrandie, ou quittée de la même façon que toute application Windows. Lorsque réduite, l'icône Report SV s'affiche dans la barre de tâches de Windows.

Vous pouvez tracer un ou plusieurs types d'informations brutes de poursuite de satellites dans la fenêtre simultanément, et utiliser les reports comme un outil diagnostique pour l'analyse des données brutes de satellite collectées pendant les périodes d'observation.

Les reports sont actifs lors de l'affichage des données. Vous pouvez déplacer votre souris à travers les reports et lire la valeur et l'heure de collecte des données.  La position du curseur de la souris lorsqu'il est au-dessus du report détermine le contenu des volets de l'indicateur de la barre d'état.

Pour plus amples informations à propos du Report SV, référez-vous aux rubriques:

  Fenêtre Report SV

  Commandes Report SV

Les opérations suivantes peuvent être effectuées pendant le travail avec les fenêtres Report SV:

  Affichage des reports

  Analyse des reports

  Exportation des données de report

  Impression des reports


     Commandes Report SV - Vue d'ensemble

Toutes les commandes Report SV sont accessible du menu. Certaines commandes sont également accessible de la barre d'outils et de la barre de dialogue.  Beaucoup des commandes ont les touches de raccourci.

Les commandes suivantes sont disponibles de la fenêtre Report de signal GPS:

Commandes de fichier

  Nouveau report

  Exporter…

  Imprimer…

  Configuration d'impression

  Quitter

Commandes d'affichage

  Données

  Barre d'outils

  Barre de dialogue

Commandes de fenêtre

  Cascade

  Mosaïque

  Organiser les icônes

Commandes d'aide

  Report SV Aide

  Index

  Utiliser l'aide

  A propos de Timeline


     Fenêtre Report SV - Vue d'ensemble

Plus amples informations

Dialogue	Voir aussi
Vue d'ensemble

Utilisez cette fenêtre pour tracer and analyser visuellement les informations brutes de poursuite de satellites collectées pendant une observation par rapport aux périodes de temps pour le satellite sélectionné et le levé courant. Le Report SV a son propre menu, barre d'état, barre d'outils, barre de dialogue et fenêtres de report. Des fenêtres de report multiples avec des groupes séparés de reports de poursuite de satellites peuvent être affichés, réduits et agrandis. Les commandes standard de Windows peuvent être utilisées pour redimensionner, restaurer et déplacer ces fenêtres.

Un nombre de commandes Report SV sont prises en charge, y compris les commandes pour l'impression des reports et l'exportation des données de report.

Pour plus informations, référez-vous aux rubriques:

  Menu Report SV

  Barre d'état Report SV

  Barre d'outils Report SV

  Barre de dialogue Report SV

  Fenêtres Report SV


     Fenêtres Report SV

Plus amples informations

 Voir aussi

Il est possible d'afficher des reports multiples dans la même fenêtre ou d'ouvrir des nouvelles fenêtres pour afficher des report séparés ou des sélections de reports.

Considérez ce lignes directrices:

  Il est possible d'ouvrir des nouvelles fenêtres et d'afficher des reports individuels ou multiples dans la même fenêtre.

  Les commandes Windows peuvent être sélectionnées des menus de Windows ou de Configuration pour réduire, agrandir, fermer, restaurer et redimensionner les fenêtres.

  Les commandes Windows peuvent être utilisées pour organiser les fenêtres en mosaïque ou en cascade et organiser les icônes de fenêtre.

  Il est possible de sortir le report dans la fenêtre active vers une imprimante ou un fichier imprimante.

  Les données utilisées pour générer les reports peuvent également être exportées vers un fichier en format tabulaire. Ce fichier peut être imprimé plus tard en utilisant tout éditeur texte.


     Menu Report SV

 Vue d'ensemble et plus amples informations

Utilisez le menu pour exécuter les commandes pour l'affichage, l'impression et l'exportation des reports de données brutes de poursuite de satellites.

Toutes les commandes Report SV sont accessibles du menu. Certaines commandes sont également accessible de la barre d'outils et de la barre de dialogue.  Beaucoup des commandes ont les touches de raccourci.

Les commandes suivantes sont disponibles de la fenêtre Report de signal GPS:

Commandes de fichier

  Nouveau report

  Exporter…

  Imprimer…

  Configuration d'impression

  Quitter

Commandes d'affichage

  Données

  Barre d'outils

  Barre de dialogue

Commandes de fenêtre

  Cascade

  Mosaïque

  Organiser les icônes

Commandes d'aide

  Report SV Aide

  Index

  Utiliser l'aide


     Barre d'outils Report SV

 Vue d'ensemble et plus amples informations

Utilisez la barre d'outils pour ouvrir les nouvelles fenêtres de report, exporter les données et afficher l'aide.

Les commandes suivantes sont disponibles:

	Fenêtre Nouveau report
	Exporter données au fichier
	Imprimer report


     Barre d'état Report SV

 Vue d'ensemble et plus amples informations

La barre d'état indique la valeur observée et l'heure qui correspondent à la position du curseur de la souris dans la fenêtre.

Vous pouvez utiliser la souris pour identifier quand une valeur d'observation a été enregistrée sur une période d'observation.

Volet d'indicateur de message

Les messages de commande Report SV s'affichent dans ce volet d'indicateur. Lorsque la barre de sélection s'affiche sur une commande de menu ou que la souris pointe à un bouton de la barre de dialogue ou de la barre d'outils, plus amples informations au sujet de la commande s'affichent dans ce volet.

Volet d'indicateur de données de poursuite

La valeur que s'affiche dans ce volet d'indicateur varie et dépend du type de données affiché dans le report et la position courante de la souris.

Cet indicateur est mis à jour automatiquement avec les unités de mesure applicables à un type de données particulier lorsque des types multiples de données de poursuite de satellites sont tracés dans la même fenêtre. Vous pouvez utiliser la légende en bas d'un report pour vous informer des unités de mesure des données de satellite affichées dans le report.  La position courante du curseur de la souris au-dessus des données tracées détermine l'unité de mesure qui s'affiche dans l'indicateur.

Volet d'indicateur de l'heure

L'heure à laquelle les données de poursuite de satellite ont été collectées s'affiche dans ce volet. Les valeurs d'heure sont affichées sous forme de Semaine/secs GPS ou l'heure locale Windows. Vous pouvez changer le format de l'heure dans le dialogue Options d'heure .


     Barre de dialogue Report SV

 Vue d'ensemble et plus amples informations

Utilisez les boutons de la barre de dialogue pour tracer la valeur des données brutes de poursuite de satellite collectées pendant la période d'observation pour le satellite sélectionné et le levé courant.

Pour tracer les données:

  Cliquez sur n'importe quelle combinaison de boutons sur la barre de dialogue.

Vous pouvez déplacer la souris sur toute valeur d'observation sur le report et lire la barre d'état pour apprendre la période d'observation et la valeur des données brutes de poursuite de satellite.

ASTUCE: Vous pouvez changer la position de la barre de dialogue. Il est possible de la positionner dans la zone à droite de la barre d'outils ou dans la zone au-dessous de la barre d'état.

Les boutons de barre de dialogue suivants sont disponibles:

Intervalle F S1

Utilisez ce bouton pour tracer l'intervalle fixe L1 du satellite poursuivi, en mètres, collecté pendant la période d'observation. Pour plus amples informations, référez-vous à la commande Intervalle F L1.

Azimut

Utilisez ce bouton pour tracer les données d'azimut poursuivi, en degrés, du satellite collectées pendant la période d'observation. Pour plus amples informations référez-vous à la commande Azimut.

Elévation

Utilisez ce bouton pour tracer les données d'élévation, du satellite collectées pendant la période d'observation. Pour plus amples informations référez-vous à la commande Elévation.

SNR L1

Utilisez ce bouton pour tracer les données de rapport signal/bruit de porteuse L1, collectées pendant la période d'observation. Pour plus amples informations référez-vous à la commande SNR L1.

SNR L2

Utilisez ce bouton pour tracer les données de rapport signal/bruit de porteuse L2, collectées pendant la période d'observation. Pour plus amples informations référez-vous à la  commande SNR L2.

Phase L1

Utilisez ce bouton pour tracer les données de phase porteuse L1, en cycles, collectées pendant la période d'observation. Pour plus amples informations référez-vous à la commande Phase L1.

Phase L2

Utilisez ce bouton pour tracer les données de phase porteuse L2, en cycles, collectées pendant la période d'observation. Pour plus amples informations référez-vous à la commande Phase L2.

L1 Doppler

Utilisez ce bouton pour tracer le L1 Doppler poursuivi, en kHz, pendant la période d'observation. Pour plus amples informations référez-vous à la commande L1 Doppler.

L1 Aux C/A

Pour plus amples informations référez-vous à la commande L1 Aux. C/A.

Décalage d'horloge

Utilisez ce bouton pour tracer le décalage d'horloge, en millisecondes, pendant la période d'observation. Pour plus amples informations référez-vous à la commande Décalage d'horloge.


     Commande Continu (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour filtrer les segments continus affichés dans l'Afficheur de période de temps.

Pour filtrer les segments continus de l'Afficheur de période de temps:

1.	Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps.

2.	Sélectionnez Filtres d'affichage / Continu.

Les segments d'occupation sont affichés ou masqués.

Pour filtrer les segments continus:

1.	Cliquez sur l'arrière-plan de l'Afficheur de période de temps.

2.	Sur la barre d'outils Timeline, cliquez sur [image].

Les segments d'occupation sont affichés ou masqués.


     Commande Supprimer (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour supprimer un élément de Levé ou d'Occupation dans Timeline. Du fait que ces éléments Timeline représentent les données du projet, toutes les références aux données associées dans le projet sont effacées.

Pour sélectionner la commande Supprimer de l'Afficheur de période de temps:

1.	Cliquez avec le bouton droit de la souris sur l'élément de Levé ou d'Occupation.

2.	Sélectionnez Supprimer.

Pour sélectionner la commande Supprimer dans Vue de levé:

1.	Cliquez sur l'élément de Levé ou d'Occupation.

2.	Effectuez l'une des choses suivantes:

  Sélectionnez Edition / Supprimer.

  Appuyez sur Suppr.

Les données de Levé ou d'Occupation associées à l'élément sont supprimées, et l'apparence de l'élément change à un rectangle avec un bord noir pour signifier que précédemment il y avait des données à cette position sur la ligne de temps. Les données supprimées sont effacées du projet et ne peuvent plus être accédées.

ATTENTION: Considérez les effets de la suppression des données de Levé ou d'Occupation du projet.


     Commande Report DOP (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour afficher l'écran Report DOP . Cette commande n'est disponible que lorsqu'une occupation est sélectionnée dans l'Afficheur de période de temps.

Pour afficher un Report DOP du menu Occupation:

1.	Cliquez avec le bouton droit de la souris sur l'élément d'occupation .

2.	Sélectionnez Info d'éphéméride / Report DOP.

L'écran Report DOP s'affiche.

Pour afficher Report DOP de la barre d'outils Report:

1.	Cliquez sur l'élément d'Occupation.

2.	De la barre d'outils Report, cliquez sur

L'écran Report DOP s'affiche.


     Commande Activer/Désactiver (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour activer ou désactiver les éléments Timeline. Du fait que les éléments Timeline représentent des données de projet actuelles, également les données sont activées ou désactivées.

Cette commande sert surtout pour la désactivation des données problématiques lors de la réalisation des tests par tâtonnement afin d'améliorer la qualité de solution de lignes de base. Lorsqu'il n'y a aucune amélioration dans les résultats de traitement de lignes de base après la désactivation d'un élément, réactivez cet élément.

Cette commande est également disponible lors de l'édition des petites zones d'observations GPS, telles que les zones contenant un grand nombre de dérapages de cycle.

NOTE: Les options Satellite, Observation GPS, et des zones sélectionnées d'observations GPS peuvent être activés ou désactivés. Certains éléments Timeline sont protégées et ne peuvent pas être désactivés directement—ils ne sont désactivés que lorsque leurs éléments parents sont désactivés. Ces éléments protégés comprennent des icônes d'Ephéméride et des icônes de Station.

Pour sélectionner la commande Activer/Désactiver de l'Afficheur de période de temps:

1.	Sélectionnez l'icône Satellite ou l'élément d'observation GPS.

2.	Cliquez avec le bouton droit de la souris sur l'élément.

Un menu s'affiche avec la commande Désactiver/Activer.

Pour sélectionner la commande Activer/Désactiver à partir d'une zone sélectionnée dans une observation GPS:

1.	Faites glisser déplacer un rectangle de sélection autour de la zone d'observation GPS.

2.	Cliquez avec le bouton droit de la souris dans le rectangle de sélection.

Un menu s'affiche avec la commande Désactiver/Activer.

Pour sélectionner la commande Activer/Désactiver à partir d'une sélection d'observations GPS:

1.	Faites glisser déplacer un rectangle de sélection autour de la zone des éléments d'observation GPS.

2.	Cliquez avec le bouton droit de la souris dans le rectangle de sélection.

Un menu s'affiche avec la commande Désactiver/Activer.


     Commande Ephéméride

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour filtrer les icônes d'Ephéméride affichées dans l'Afficheur de période de temps. A chaque fois que cette commande est exécutée, les icônes d'Ephéméride sont affichées ou masquées.

Pour filtrer les icônes d'Ephéméride de l'Afficheur de période de temps:

1.	Cliquez avec le bouton droit de la souris dans l'arrière-plan de l'Afficheur de période de temps.

2.	Sélectionnez Filtres d'affichage.

Un sous-menu s'affiche avec la commande Ephéméride.

Pour filtrer les icônes d'Ephéméride de la barre d'outils Timeline:

1.	Cliquez dans l'arrière-plan de l'Afficheur de période de temps.

2.	Dans la barre d'outils Timeline, cliquez sur [image].


     Info d'éphéméride (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour afficher un sous-menu avec des options pour l'affichage du Report DOP et le Plan du ciel pour une occupation sélectionnée.

Pour afficher le sous-menu Info d'éphéméride:

1.	Sélectionnez l'élément d'Occupation.

L'occupation est soulignée.

2.	Cliquez avec le bouton droit de la souris sur l'occupation.

Un menu s'affiche avec la commande Info d'éphéméride.

Les commandes suivantes sont disponibles dans le sous-menu:

  Report SV

  Plan du ciel

NOTE: Les commandes ci-dessus sont également disponibles de la barre d'outils Report.


     Commande Agrandir tout (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour ouvrir tous les dossiers de données dans la barre de contrôle Timeline.

NOTE: Au moins un dossier de données doit être fermé avant que cette commande devient disponible.

Pour sélectionner la commande Agrandir tout de la barre de contrôle:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de la barre de contrôle ou un dossier de données.

Un menu s'affiche avec la commande Sélectionner tout.

Pour sélectionner la commande Agrandir tout de la barre d'outils Timeline:

1.	Cliquez sur l'arrière-plan de la barre de contrôle ou un dossier de données.

2.	De la barre d'outils Timeline, cliquez sur [image].

ASTUCE: Vous pouvez également ouvrir des dossiers de données individuels en cliquant sur [image] dans le dossier de données.


     Commande Suivant (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour déplacer l'Afficheur de période de temps à l'élément de Levé suivant. Sélectionnez cette commande plusieurs fois afin de déplacer l'Afficheur de période de temps rapidement à chaque élément de Levé successif dans le dossier de données.

Pour sélectionner la commande Suivant de l'Afficheur de période de temps:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps.

Un menu s'affiche avec la commande Suivant.

Pour sélectionner la commande Suivant de la barre d'outils Timeline:

1.	Cliquez sur l'arrière-plan de l'Afficheur de période de temps, un élément de Levé ou un dossier de données.

2.	Dans la barre d'outils Timeline, cliquez sur [image].

ASTUCE: Vous pouvez également prendre la route directe lorsque vous vous déplacez vers un élément d'occupation. Par exemple, vous pouvez afficher les propriétés d'une ligne de base de la fenêtre Affichage de levé et sélectionner une occupation de la liste de Sélection. Ainsi l'Afficheur de période de temps est déplacé à l'occupation sélectionnée et il la souligne.

ASTUCE: Vous pouvez également utiliser la commande Etendue de zoom pour afficher la ligne de temps entière, sélectionner l'occupation requise, et utiliser la commande Zoom à l'étendue pour l'afficher dans l'Afficheur de période de temps.


     Commande Précédent (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour déplacer l'Afficheur de période de temps au point de fin de l'occupation précédente. Sélectionnez cette commande plusieurs fois afin de déplacer l'Afficheur de période de temps rapidement à chaque occupation successive dans les données de levé.

Pour sélectionner la commande Précédent de l'Afficheur de période de temps:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps, une rectangle de Levé , ou un élément d'Occupation. Un menu s'affiche avec la commande Précédent.

Pour sélectionner la commande Précédent de la barre d'outils Timeline:

1.	Cliquez sur l'arrière-plan de l'Afficheur de période de temps, une rectangle de Levé , ou un élément d'Occupation..

2.	Dans la barre d'outils Timeline, cliquez sur [image].

ASTUCE: Vous pouvez également prendre la route directe lorsque vous vous déplacez vers un élément d'occupation. Par exemple, vous pouvez afficher les propriété d'une ligne de base de la fenêtre Affichage de levé et sélectionner une occupation de la liste de Sélection. Ainsi l'Afficheur de période de temps est déplacé à l'occupation sélectionnée et il la souligne.

ASTUCE: Vous pouvez également utiliser la commande Etendue de zoom pour afficher la ligne de temps entière, sélectionner l'occupation requise, et utiliser la commande Zoom à l'étendue pour l'afficher dans l'Afficheur de période de temps.


     Commande Satellites (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour filtrer toutes les observations GPS qui s'affichent dans l'Afficheur de période de temps. A chaque fois que cette commande est exécutée, elle affiche ou masque les Observations GPS.

Pour filtrer les observations GPS de l'Afficheur de période de temps:

1.	Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps.

2.	Sélectionnez Filtres d'affichage.

Un sous-menu s'affiche avec la commande Satellites.

Pour filtrer les observations GPS de la barre d'outils Timeline:

1.	Cliquez sur l'arrière-plan de l'Afficheur de période de temps.

2.	Dans la barre d'outils Timeline, cliquez sur [image].

Toutes les icônes d'Ephéméride, associées aux observations GPS, sont affichées ou masquées lorsque cette commande est exécutée.


     Commande Réduire tout (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour fermer tous les dossiers de données ouverts dans la barre de contrôle Timeline.

NOTE: Au moins un dossier de données doit être ouvert avant que cette commande devient disponible.

Pour sélectionner la commande Réduire tout de la barre de contrôle:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de la barre de contrôle ou un dossier de données.

Un menu s'affiche avec la commande Réduire tout.

Pour sélectionner la commande Réduire tout de la barre d'outils Timeline:

1.	Cliquez sur l'arrière-plan de la barre de contrôle ou un dossier de données.

2.	Dans la barre d'outils Timeline, cliquez sur [image].

ASTUCE: Vous pouvez également fermer les dossiers de données individuels en cliquant sur le symbole [image]  sur le dossier.


    Commande Plan du ciel (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour afficher un Plan du ciel. Cette commande n'est disponible que lorsque un élément d'Occupation est sélectionné de l'Afficheur de période de temps. L'affichage du Plan du ciel montre un report de l'horizon local de la constellation de satellites visible d'un point sélectionné au temps de l'occupation. Les positions de satellite sont calculées des informations d'éphéméride qui ont été courantes au temps de l'observation, et sont affichées en fonction de l'azimut et l'élévation.

Pour afficher le Plan du ciel d'une occupation:

1.	Pour ouvrir les fichiers de données, effectuez l'une des choses suivantes:

  De la barre de contrôle, ouvrir un fichier de données en utilisant l'une de  ces actions.

  Cliquez sur [image] sur le dossier de données.

  Cliquez avec le bouton droit de la souris sur le dossier de données et sélectionnez  Agrandir tout.

  De la barre d'outils Timeline, cliquez sur [image].

La première action affiche les icônes de Satellite pour le dossier de données sélectionné. Les deux autres actions agrandissent tous les dossiers de données.

2.	Sélectionnez l'élément d'Occupation.

3.	Pour sélectionner la commande Plan du ciel, effectuez l'une des choses suivantes:

  Cliquez avec le bouton droit de la souris sur l'Occupation pour afficher et sélectionner Info d'éphéméride pour afficher un sous-menu avec la commande Plan du ciel.

  Dans la barre d'outils Report, cliquez sur [image].


     Commande Report SV (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour afficher l'affichage Report SV . Le Report SV comprend les commandes pour l'affichage et l'impression des informations de poursuite de satellites sélectionnées. En outre il sert à l'analyse des informations brutes de poursuite de satellites pour les satellites individuels. Cette commande n'est disponible que lorsqu'une icône de satellite est sélectionnée de la barre de contrôle.

Pour afficher Report SV:

1.	Pour ouvrir les fichiers de données, effectuez l'une des choses suivantes:

  De la barre de contrôle, ouvrez un fichier de données en utilisant l'une de  ces actions.

  Cliquez sur [image]  sur le dossier de données.

  Cliquez avec le bouton droit de la souris sur le dossier de données et sélectionnez Agrandir tout.

  De la barre d'outils Timeline, cliquez sur [image].

La première action affiche les icônes de Satellite pour le dossier de données sélectionné. Les deux autres actions agrandissent tous les dossiers de données.

2.	Sélectionnez l'icône de Satellite requise.

3.	Pour sélectionner la commande Report SV, effectuez l'une des choses suivantes:

  Cliquez sur le bouton droit de la souris sur l'icône de Satellite pour afficher un menu avec la commande Report SV.

  Dans la barre d'outils Timeline, cliquez sur [image].


     Commande Options d'heure (Timeline)

Plus amples informations

Dialogue	Voir aussi
Sélectionnez cette commande pour afficher le dialogue Options d'heure pour sélectionner le format d'heure utilisé pour l'affichage de l'heure dans la Règle de temps, les dialogues de propriétés de Timeline, le Report SV, le Plan du ciel, le Report DOP, et la barre d'état Vue de levé.

Pour afficher le dialogue Options d'heure, effectuez l'une des choses suivantes:

  Double cliquez sur la Règle de temps.

  Cliquez avec le bouton droit de la souris pour afficher un menu avec la commande Options d'heure.


     Commande Filtres d'affichage

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour afficher le sous-menu des commandes utilisées pour filtrer les informations s'affichant dans l'Afficheur de période de temps.

Pour afficher le sous-menu Filtres d'affichage de l'Afficheur de période de temps:

1.	Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps.

2.	Sélectionnez Filtres d'affichage du menu.

Un sous-menu de commandes s'affiche.

Les commandes suivantes sont disponibles:

  Continu

  Satellites

  Ephéméride

NOTE: Cette commande n'est pas disponible sur la barre d'outils Timeline, mais les commandes individuelles sur le sous-menu sont disponibles. Pour plus amples informations, référez-vous aux rubriques ci-dessus.


    Commande Zoom avant (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour faire un zoom de l'Afficheur de temps à 200%. Les champs Début et Fin dans la Règle de temps sont mis à jour pour refléter la période de temps plus courte.

Pour sélectionner la commande Zoom avant de l'Afficheur de période de temps:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de ligne de temps.

Un menu s'affiche avec la commande Zoom avant.

Pour sélectionner la commande Zoom avant de Vue de levé:

1.	Cliquez sur l'arrière-plan de l'Afficheur de ligne de temps.

2.	Pour sélectionner la commande Zoom avant, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Zoom pour afficher un sous-menu avec la commande Zoom avant.

  Dans la barre d'outils Afficher contrôles, cliquez sur [image].


     Commande Etendue de zoom (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour faire un zoom arrière de l'Afficheur de période de temps pour affiche la ligne de temps entière. Cette commande sert à indiquer la période de temps occupée par un élément Timeline par rapport à la ligne de temps totale. Vous pouvez utiliser cette commande et puis utiliser Vue précédente pour retourner à votre niveau de grossissement initial.

Pour sélectionner la commande Etendue de zoom de la zone d'affichage Timeline:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan ou sur un élément Timeline.

Un menu s'affiche avec la commande Etendue de zoom.

Pour afficher la commande Etendue de zoom de la Vue de levé:

1.	Cliquez sur un élément Timeline ou l'arrière-plan de l'Afficheur de période de temps.

2.	Sélectionnez Affichage / Zoom pour afficher un sous-menu avec la commande Etendue de zoom.


    Commande Zoom arrière (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour faire un zoom arrière de l'Afficheur de période de temps à 50%. Les champs Début et Fin dans la Règle de temps sont mis à jour pour refléter la période de temps plus longue.

Pour sélectionner la commande Zoom arrière de Timeline:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de ligne de temps.

Un menu s'affiche avec la commande Zoom arrière.

Pour sélectionner la commande Zoom arrière de Vue de levé:

1.	Cliquez sur l'arrière-plan de l'Afficheur de ligne de temps.

2.	Effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Zoom arrière pour afficher un sous-menu avec la commande Zoom arrière.

  Dans la barre d'outils Afficher contrôle, cliquez sur [image].


     Commande Vue précédente (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour faire un zoom au grossissement précédent.

Pour sélectionner la commande Vue précédente de la zone d'affichage Timeline:

  Cliquez avec le bouton droit de la souris sur un élément Timeline.

Un menu s'affiche avec la commande Vue précédente.

Pour sélectionner la commande Vue précédente de Vue de levé:

1.	Cliquez sur un élément Timeline.

2.	Pour sélectionner la commande, effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Zoom pour afficher un sous-menu avec la commande Vue précédente.

  Dans la barre d'outils Afficher contrôle, cliquez sur [image].


     Commande Zoom à l'étendue (Timeline)

Plus amples informations

 Voir aussi

Sélectionnez cette commande pour faire un zoom de la période de temps d'un élément Timeline sélectionné à la largeur de l'Afficheur de période de temps.

Pour faire un zoom de l'élément afin de remplir l'Afficheur de période de temps:

1.	Sélectionnez un élément Timeline.

2.	Cliquez avec le bouton droit de la souris sur l'élément.

3.	Sélectionner Zoom à l'étendue.


     Commande Evénements (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande pour afficher les icônes d'Evénement dans l'Afficheur de période de temps.

Pour filtrer les icônes d'Evénement:

  Dans la barre d'outils Timeline, cliquez sur [image].

Les icônes d'Evénement s'affichent dans l'Afficheur de période de temps si les événements sont compris dans les données.


     Commande Propriétés (Timeline)

Plus amples informations

Comment ...	Dialogue
Sélectionnez cette commande pour afficher le dialogue de propriétés pour l'élément Timeline sélectionné.

Pour afficher les propriétés d'un élément Timeline:

1.	Cliquez avec le bouton droit de la souris sur l'élément Timeline

2.	Sélectionnez Propriétés.

Le dialogue de propriétés applicable s'affiche.

Les commandes de propriétés existent pour les dialogues suivants:

  Propriétés de récepteur

  Observation GPS

  Levé

  Occupation statique

  Segment continu d'occupation

  Icône d'éphéméride

ASTUCE: Au lieu d'utiliser cette commande, vous pouvez double cliquer sur un élément Timeline pour afficher ses propriétés.


     Commande Planification de reports (Timeline)

Sélectionnez cette commande pour afficher ou masquer la barre d'outils Planification de reports.

Pour afficher ou masquer la barre d'outils Planification de reports:

  Sélectionnez Affichage / Barres d'outils / Planification de reports.

La barre d'outils Planification de reports est affichée ou masquée chaque fois que la commande est exécutée.


     Commande Timeline (Barres d'outils)

Sélectionnez cette commande pour afficher ou masquer la barre d'outils Timeline.

Pour afficher ou masquer la barre d'outils Timeline:

  Sélectionnez Affichage / Barres d'outils / Timeline.

La barre d'outils Timeline est affichée ou masquée chaque fois que la commande est exécutée.


     Commande Stations (Timeline)

Plus amples informations

Comment ...	Voir aussi
Les petites icônes rouges triangulaires de Station et les étiquettes affichées pour identifier les Occupations statiques peuvent être filtrées.

Pour filtrer les icônes de station:

1.	Affichez Timeline.

Pour plus amples informations, référez-vous à l'Affichage Timeline.

2.	Dans la barre d'outils Timeline, cliquez sur [image].

Chaque fois que la commande Stations est exécutée, les icônes de Station sont activées ou désactivées.

NOTE: Il n'est pas possible de supprimer ou de désactiver les icônes de Station—elles sont seulement supprimées ou désactivées avec leur occupation parente.


     Commande Sélectionner tout (Timeline)

Plus amples informations

Comment ...	Voir aussi
Sélectionnez cette commande d'un champ d'Edition de période de temps pour sélectionner toutes les données dans le champ. Ce sert à la sélection de toutes les données avant de couper ou de copier les données au presse-papiers.

Pour sélectionner toutes les données dans un champ d'Edition de période de temps:

1.	Cliquez sur le champ Démarrer ou Arrêter l'édition de période de temps.

2.	Cliquez avec le bouton droit de la souris et choisissez Sélectionner tout.

Toutes les données dans le champ sont sélectionnées.


    Dialogue Propriétés de récepteur

Plus amples informations

 Vue d'ensemble et plus amples informations

Utilisez ce dialogue pour apprendre des informations générales concernant le récepteur utilisé pour collecter les données de levé. Tous les champs sont de données en lecture seule, obtenues à partir des enregistrements des informations de récepteur téléchargés, ou à partir des enregistrements d'en-tête dans un fichier RINEX .

Pour afficher le dialogue Propriétés de récepteur:

  Double cliquez sur un dossier de données. Le dialogue Propriétés de récepteur s'affiche avec les champs en lecture seule suivants:

Numéro de série

Ce champ indique le numéro de série du récepteur.

Type de récepteur

Ce champ indique le modèle du récepteur.


    Dialogue Propriétés du levé

Plus amples informations

Dialogue	Voir aussi

Utilisez ce dialogue pour afficher les informations concernant les sessions d'enregistrement de données de levé individuelles.

Pour ouvrir le dialogue Propriétés du levé, effectuez l'une des choses suivantes:

  Double cliquez sur l'élément de Levé.

  Cliquez avec le bouton droit de la souris sur l'élément de Levé, et sélectionnez Propriétés.

Les champs de données suivants sont disponibles:

ID de session

Ce champ montre le nom de la session de levé. Entrez une nouvelle ID de session si vous voulez identifier la session d'une nouvelle façon. C'est le seul champ pouvant être édité dans ce dialogue.

Nom du fichier de données

Ce champ montre le nom du fichier associé au levé.

Heure de début

Ce champ montre l'heure de début de la session de Levé dans l'heure locale Windows ou Semaine/secondes GPS. Le format de l'heure dépend de la configuration dans Options d'heure courante.

Heure de fin

Ce champ montre l'heure de fin de la session de Levé dans l'heure locale Windows ou Sentent/secondes GPS. Le format de l'heure dépend de la configuration dans Options d'heure.

Version de processeur nav

Ce champ montre la version de matériel du Processeur de Navigation du récepteur (seuls les récepteurs Trimble).

Taux d'époque

Ce champ montre le taux minimum de synchronisation, en secondes, utilisé pour collecter les données de la session de levé.

Version de processeur de signaux

Ce champ montre la version de matériel du Processeur de Signaux du récepteur (seuls les récepteurs Trimble).

Masque d'élév

Ce champ montre le masque d'élévation actif lors de la collecte de données.

Type de DC

Ce champ montre le carnet de terrain et le numéro de version du Survey Controller, si les données de levé ont été utilisées dans le levé.


    Dialogue Occupation/Segment de données - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi

Utilisez ce dialogue pour afficher et éditer toutes les informations ayant rapport aux Occupations statiques et aux Segments mobiles et continus. Un dialogue séparé peut être ouvert pour chaque segment, vous permettant de comparer les données des segments multiples.

Pour afficher le dialogue Occupation/Segment de données, effectuez l'une des choses suivantes:

  Double cliquez sur un élément d'occupation.

  Cliquez avec le bouton droit de la souris sur un élément d'Occupation, et sélectionnez Propriétés.

Les deux tabulations suivantes sont disponibles:

  Segment

  Antenne

Dans le coin en haut à droite du dialogue Occupation/Segment de données se trouve un bouton rotatif gauche-droit. Si le levé comprend des occupations multiples, utilisez ces boutons rotatifs pour afficher des informations de l'occupation suivante ou précédente. Lorsque le dialogue pour l'occupation suivante est affichée dans un autre dialogue de propriétés et que vous appuyez sur le bouton de direction droit, cette occupation est sautée.


    Dialogue Occupation/Segment de données - Tabulation Segment

Plus amples informations

Comment ...	Dialogue	Voir aussi

La tabulation Segment affiche les informations d'occupation totales pour l'édition.

Pour afficher la tabulation Segment, effectuez l'une des choses suivantes:

  Double cliquez sur l'élément d'Occupation.

  Cliquez avec le bouton droit de la souris sur un élément d'Occupation et sélectionnez Propriétés

Le dialogue Occupation/Propriétés de segments de données s'affiche avec la tabulation Segment affiché.

Les champs ou contrôles suivants sont disponibles:

Nom de point

Lisez ce champ pour apprendre le nom du point auquel l'occupation s'est produite. Ce champ sera vide pour les Segments continus et mobiles.

Type de segment

Sélectionnez une option de cette liste pour changer le segment à l'un de ces types:

  Occupation statique

  Occupation statique rapide

  Occupation Arrêt&Début

  Segment mobile

  Segment continu

NOTE: Les options Statique et Statique rapide peuvent s'afficher ou non, selon le type de données disponibles dans le fichier.

AVERTISSEMENT: Le changement de la désignation d'une occupation à Mobile ou Continu ne devrait être effectué qu'avec prudence. Lorsqu'une Occupation statique est changée à continu, la référence de station à la station de cette occupation est supprimée.

Heure de début

Editez ce champ pour changer l'heure de début de l'occupation. L'heure s'affiche sous forme de l'heure locale Windows ou Semaine/secondes GPS, selon la configuration dans Options d'heure courante.

Heure de fin

Editez ce champ pour changer l'heure de fin de l'occupation. L'heure s'affiche sous forme de l'heure locale Windows ou Semaine/secondes GPS, selon la configuration dans Options d'heure courante.

ASTUCE: Les heures de début et de fin peuvent également être éditées en sélectionnant l'élément d'occupation dans l'Afficheur de période de temps et changeant les champs Heure de début et Heure de fin dans la Règle de temps.


    Dialogue Occupation/Segment de données - Tabulation Antenne

Plus amples informations

Comment ...	Dialogue	Voir aussi
Utilisez cette tabulation pour ajuster la hauteur de l'antenne (en mètres), le type d'antenne, et le type de mesure.

Pour afficher les propriétés d'Antenne:

1.	Pour ouvrir le dialogue Occupation/Segment de données, effectuez l'une des choses suivantes:

  Double cliquez sur un élément d'Occupation.

  Cliquez avec le bouton droit de la souris sur un élément d'Occupation, et sélectionnez Propriétés

Le dialogue Occupation/Segment de données s'affiche.

2.	Cliquez sur Antenne.

Les propriétés d'Antenne s'affichent.

Hauteur d'antenne

Utilisez ce champ pour afficher ou éditer la hauteur d'antenne mesurée.

Type

Utilisez ce champ pour afficher ou sélectionner le type d'antenne connecté au récepteur.

Mesuré à

Utilisez ce champ pour afficher ou sélectionner la méthode utilisée pour mesurer la hauteur d'antenne.

Au-dessous du champ Mesuré à se trouve un groupe de boutons de radio qui contrôlent comment les informations d'antenne s'appliquent. Ces boutons comprennent:

  Utiliser pour seulement cette mesure n'applique les changements qu'au segment ou l'occupation sélectionné. C'est la configuration par défaut.

  Utiliser pour celle-ci et les mesures subséquentes dans cette session applique les changements à l'occupation ou au segment sélectionné, ainsi qu'à tous les segments et les occupations subséquents jusqu'à la fin de l'élément de Levé.

  Utiliser pour toutes les mesures dans cette session applique les changements à tous les segments et les occupations dans l'élément de Levé.


    Dialogue Propriétés d'observation GPS

Plus amples informations

Comment ...	Dialogue	Voir aussi

Utilisez ce dialogue pour afficher les types d'observation disponibles pour un élément d'Observation GPS sélectionné.

Pour afficher le dialogue Propriétés d'Observation GPS:

1.	Pour ouvrir les dossiers de données dans la barre de contrôle, effectuez l'une des choses suivantes:

  Cliquez avec le bouton droit de la souris sur le dossier de données, et sélectionnez Agrandir tout.

  Dans la barre d'outils Timeline, cliquez sur

  Dans un dossier de données, cliquez sur le symbole [image].

Toutes les Observations GPS dans l'Afficheur de période de temps et toutes les Icônes de SV dans la barre de contrôle s'affichent.

ASTUCE: Ces éléments peuvent être affichés à tout moment en cliquant sur [image] dans la barre d'outils Timeline ou en cliquant avec le bouton droit de la souris sur le dossier de données et sélectionnant Réduire tout du menu.  Vous pouvez également fermer des dossiers individuels en cliquant sur [image].

2.	Pour afficher le dialogue de propriétés, effectuez l'une des choses suivantes:

  Double cliquez sur un élément d'Observation GPS.

 Cliquez avec le bouton droit de la souris sur un élément d'Observation GPS, et sélectionnez Propriétés.

Le dialogue Propriétés d'observation GPS s'affiche.

Les champs suivants sont disponibles:

Début

Editez ce champ pour changer l'heure de début de l'Observation GPS sélectionnée. L'heure qui s'affiche dans ce champ se base initialement sur la sélection d'observation GPS courante dans l'Afficheur de période de temps. Tout changement appliqué aux données d'observation GPS est basé sur cette heure de début. Lorsque vous changez l'heure de début dans ce champ, tous les changements sont appliqués à tous les satellites sélectionnés actuellement de la liste Satellites à éditer ou la zone(s) d'observation GPS sélectionnée dans l'Afficheur de période de temps.

Arrêt

Editez ce champ pour changer l'heure de fin de l'Observation GPS sélectionnée. L'heure qui s'affiche dans ce champ se base initialement sur la sélection d'observation GPS courante dans l'Afficheur de période de temps. Tout changement appliqué aux données d'observation GPS est basé sur cette heure de fin. Lorsque vous changez l'heure de fin dans ce champ, tous les changements sont appliqués à tous les satellites sélectionnés actuellement de la liste Satellites à éditer ou la zone(s) d'observation GPS sélectionnée dans l'Afficheur de période de temps.

Types d'observation

Utilisez ce groupe de contrôle pour désactiver ou activer les Types d'observation compris dans les Observations GPS. Chaque Type d'observation est une forme des informations brutes de satellite.

Les cases à cocher suivantes de Type d'observation sont disponibles:

  Phase L1

  Code P L1

  Code C/A L1

  Phase complète L2

  Semi-phase L2

  Code P L2

  L2 encrypté

Considérez ces lignes directrices lors de l'affichage ou l'édition des Types d'observation:

  Une coche pour un Type d'observation indique que les données sont utilisées, pendant qu'une case à cocher vide indique que le type de données n'est pas compris.

  Une coche grise indique que des périodes de temps activées et désactivées sont dans l'Observation GPS, et qu'aucune opération ne doit être effectuée sur le Type d'observation.

  Du texte obscurci à côté d'une coche indique que le Type d'observation n'est pas disponible.

  Effacez les coches pour désactiver les données sélectionnées.

Remettre

Cliquez sur ce bouton pour remettre toutes les cases à cocher de Types d'observation à leur état d'origine—c'est à dire, l'état lors de la collecte des données sur le terrain.

Satellites à éditer

Sélectionnez les cases à cocher dans cette liste pour sélectionner les satellites et leurs données brutes d'observation GPS à éditer.

NOTE: Lorsque des satellites multiples sont sélectionnés de cette liste, les changements dans les propriétés sont appliqués à toutes les observations GPS sur la période de temps sélectionnée dans ce dialogue de propriétés.

ASTUCE: Il est également possible de sélectionner les observations GPS directement dans l'Afficheur de période de temps en faisant glisser déplacer un rectangle de sélection autour d'un groupe d'observations ou autour d'une petite zone d'une observation GPS. Pour plus amples informations, référez-vous à Sélection et Edition des observations GPS.

Activer tout

Cliquez sur ce bouton pour activer tous les Types d'observation pour les satellites sélectionnés de la liste Satellites à éditer pendant la période de temps définie par les champs Début et Arrêt.

Désactiver tout

Cliquez sur ce bouton pour désactiver tous les Types d'observation pour les satellites sélectionnés de la liste Satellites à éditer pendant la période de temps définie par les champs Début et Arrêt.


    Phase L1

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsque le récepteur a la capacité de récupérer les mesures de Phase L1. Les récepteurs à monofréquence ou à bi-fréquence peuvent poursuivre ces données.

Lorsque configurée, la case à cocher peut être effacée (pour des satellites individuels, les sélections de satellites, ou des zones d'éléments d'observation GPS) pour désactiver les données de Phase L1.


    Code P L1

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsque le Code P L1 est poursuivi sur la porteuse L1. La plupart des récepteurs à bi-fréquence et certains récepteurs à monofréquence peuvent poursuivre ces données lorsque l'Anti-déception électronique est désactivée.

Lorsque configurée, cette case à cocher peut être effacée (pour les satellites individuels, les sélections de satellites, ou les zones d'éléments d'observation GPS) pour désactiver les données de Code P L1.


    Code C/A L1

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsque le Code d'acquisition approximatif est poursuivi sur la porteuse L1. Les récepteurs à monofréquence ou bi-fréquence peuvent poursuivre ces données.

Lorsque configurée, la case à cocher peut être effacée pour les satellites individuels, les sélections de satellites, ou les zones sélectionnées d'observations GPS pour désactiver les données de Code C/A L1.


    Phase complète L2

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsque le récepteur GPS a la capacité de récupérer les mesures de Phase porteuse de phase complète L2. La plupart des récepteurs à bi-fréquence peuvent collecter ces données.

Lorsque configurée, la case à cocher peut être effacée (pour les satellites individuels, les sélections de satellites, ou les zones sélectionnées d'une observation GPS) pour désactiver les données de Phase complète L2.


    Semi-phase L2

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsqu'un récepteur ne peut récupérer que les mesures de Phase porteuse de semi-phase L2. Certains récepteurs à bi-fréquence peuvent collecter ces données.

Lorsque configurée, la case à cocher peut être effacée—pour les satellites individuels ou les sélections de satellites pour désactiver les données de Semi-phase L2.


    Code P L2

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsque le Code P L2 est poursuivi sur la porteuse L2. La plupart des récepteurs à bi-fréquence peuvent collecté ces données lorsque l'Anti-déception électronique (A/S) est désactivée.

Lorsque configurée, la case à cocher peut être effacée (pour les satellites individuels, les sélections de satellites, ou les zones sélectionnées des éléments d'observation GPS) pour désactiver les données de Code P L2.


    L2 encrypté

 Vue d'ensemble et plus amples informations

Ce Type d'observation est disponible lorsque le Code P L2 est encrypté durant les temps que l'Anti-déception électronique A/S est activée.  Les récepteurs Trimble utilisent des techniques propriétaires qui fournissent l'avantage de poursuivre le code sur L2, même pendant les périodes d'encryption.  Les mesures disponibles au moyen de ces techniques propriétaires sont connues comme Encryptées L2.

Lorsque configurée, la case à cocher peut être effacée (pour les satellites individuels, les sélections de satellites, ou les zones sélectionnées des éléments d'observation GPS) pour désactiver les données encryptées L2.


    Dialogue Propriétés d'éphéméride de satellite

Plus amples informations

Comment ...	Dialogue	Voir aussi

Utilisez ce dialogue pour afficher les informations d'éphéméride de satellite émises périodiquement aux utilisateurs GPS. Ces informations sont dérivées des données de satellite et ne peuvent pas être éditées.

Pour afficher le dialogue Propriétés d'éphéméride de satellite:

1.	Pour afficher les icônes d'Ephéméride, effectuez l'une des choses suivantes:

  Dans la barre d'outils Timeline, cliquez sur [image].

  Cliquez avec le bouton droit de la souris sur l'Afficheur de période de temps, et sélectionnez Filtrer / Ephéméride.

Des icônes d'éphéméride bleues s'affichent sur les informations de poursuite de SV.

2.	Pour afficher les propriétés d'Ephéméride, effectuez l'une des choses suivantes:

  Double cliquez sur l'icône d'Ephéméride pour le satellite souhaité.

  Cliquez avec le bouton droit de la souris sur l'icône d'Ephéméride pour le satellite souhaité, et sélectionnez Propriétés.

Le dialogue Informations d'éphéméride de satellite s'ouvre.

Les options suivantes sont disponibles:

Satellite

Ce champ montre l'identificateur PRN de satellite assigné au satellite.

Heure de collecte

Ce champ montre la Semaine/secondes GPS ou l'Heure locale à laquelle l'éphéméride émise a été collectée du satellite. Le format de l'heure dépend de la configuration dans Options d'heure courante.

IODC

Ce champ montre l'Emission de données, et la Valeur d'horloge comprises dans l'éphéméride émise.

Heure d'éphéméride

Ce champ montre la Semaine/secondes GPS ou l'Heure locale à laquelle l'éphéméride a été émise. Le format de l'heure dépend de la configuration Options d'heure courante.

Temps depuis époque

Ce champ montre le temps depuis l'Epoque de référence d'éphéméride, arrondie à la minute plus proche.

Semaine GPS

Ce champ montre la semaine GPS à laquelle l'éphéméride a été collectée.

La semaine GPS 0 (zéro) a commencé le 6 janvier 1980. Un Cycle de semaine GPS est  1,024 semaines (0 – 1023) ou 7168 jours. Le Cycle de semaine GPS s'est recommencé à minuit le 21 août 1999. A ce moment, la Semaine GPS émise par les satellites s'est recommencée à la semaine 0 (zéro). Cependant, les récepteurs Trimble maintiennent un compte de semaines continu intérieurement.

Les secondes GPS se recommencent à zéro à minuit du samedi de chaque Semaine GPS, corrélées à UTC.

URA

Ce champ montre la Précision en distance de l'utilisateur du satellite, convertie en mètres. L'URA est un indicateur de précision en distance de la qualité des données de satellite.

Avertissement URA

Ce champ vous informe si l'indicateur d'Avertissement de précision en distance de l'utilisateur est activé ou désactivé pour le satellite. Cet indicateur est configuré lorsque la précision en distance peut être plus mauvaise que la valeur indiquée par l'URA.

Santé

Ce champ affiche le message de santé compris pour le satellite dans l'éphéméride. Le message Santé est un indicateur de la qualité des signaux émis du satellite. Le satellite est en bonne santé lorsque ce champ indique:

Toutes les données SV OK.

Un nombre d'autres valeurs pourraient être affichées, et en général, celles-ci indiquent une santé de satellite moins bonne. Pour plus amples informations concernant ces messages, prenez une copie de la publication ICD-GPS-200 référencée dans la Bibliographie.

A/S

Ce champ vous informe si l'indicateur de mode Anti-détection électronique est activé ou désactivé pour le satellite.


    Dialogue Options d'heure

Plus amples informations

Comment ...	Dialogue

Utilisez ce dialogue pour sélectionner le format d'heure pour l'affichage des périodes de temps dans la Règle de temps et l'heure s'affichant dans tous les dialogues Timeline, les affichages et la barre d'état.

Pour afficher le dialogue Options d'heure, effectuez l'une des choses suivantes:

  Double cliquez dans la Règle de temps.

  Cliquez avec le bouton droit de la souris sur la Règle de temps, et sélectionnez Options d'heure.

Le dialogue Options d'heure s'affiche.

Les options suivantes sont disponibles:

Heure locale

Sélectionnez ce champ pour afficher l'heure dans le format d'heure locale Windows.

Semaine/secondes GPS

Sélectionnez ce champ pour afficher l'heure en Semaine/secondes GPS.

La semaine GPS 0 (zéro) a commencé le 6 janvier 1980. Un Cycle de semaine GPS est  1,024 semaines (0 – 1023) ou 7168 jours. Le Cycle de semaine GPS  s'est recommencé à minuit le 21 août 1999. A ce moment, la Semaine GPS émise par les satellites s'est recommencée à la semaine 0 (zéro). Cependant, les récepteurs Trimble maintiennent un compte de semaines continu intérieurement.

Les secondes GPS se recommencent à zéro à minuit du samedi de chaque Semaine GPS, corrélées à UTC.


    Segments continus

Plus amples informations

Comment ...	Dialogue	Voir aussi

Les Segments continus représentent les périodes de temps quand le récepteur effectue la collecte de données continûment pendant qu'il se déplace. Le but d'un Segment continue est de traiter une ligne de base de la base au récepteur à chaque cycle de mesure. Il diffère d'un Segment mobile du fait qu'un Segment mobile n'est pas destiné d'être traité. Au début, les Segments continus n'ont pas une association de point avant qu'ils sont traités. Pourtant, une fois que le traitement est complété, un point est généré et stocké dans le projet pour chaque cycle de mesure, ainsi affichant le chemin du récepteur dans Vue de levé.

Double-cliquez sur un élément de Segment continu pour afficher ou éditer ses propriétés.

Vous pouvez cliquer avec le bouton droit de la souris n'importe où dans l'élément de segment afin d'afficher un menu de commandes pour travailler avec les données de segment.

Il est possible d'ajuster la période de temps du Segment continu. Il est également possible de changer un Segment continu à un Segment mobile afin qu'aucun traitement ne se produit.

A cause du fait que la fenêtre graphique et Timeline sont liés, les occupations des points et des lignes de base sélectionnées dans la fenêtre graphique sont sélectionnées dans Timeline et vice versa. Par exemple, vous pouvez sélectionner un Segment continu dans Timeline pour voir ses points et ses lignes de base sélectionnés dans la fenêtre graphique. Une fois que les points ou la ligne de base sont sélectionnés, vous pouvez afficher leurs propriétés pour apprendre plus informations concernant l'occupation.

Il est possible d'afficher deux reports avec les informations concernant la constellation de satellites pour le temps d'occupation ou de segment lorsqu'un segment continu est sélectionné.  Pour plus amples informations, référez-vous aux rubriques suivantes:

  Report DOP

  Plan du ciel

ASTUCE: La fenêtre Propriétés, accédée de la fenêtre graphique, sert également à la navigation à travers Timeline pour trouver les occupations sélectionnées. Les occupations des lignes de base et des points sélectionnées dans ce dialogue sont également sélectionnées dans Timeline. Une fois sélectionné, vous pouvez double cliquer sur l'élément d'occupation dans Timeline pour lire ses propriétés.

Les éléments d'Occupation et de Segment sont affichés sous forme des rectangles codifiés par couleurs pour une identification facile. Pour plus amples informations, référez-vous à Procédé de codification de l'occupation par couleurs .


    Afficheur de période de temps

Plus amples informations

Comment ...	Dialogue	Voie aussi

Il faut imaginer l'Afficheur de période de temps comme une loupe—il peut afficher la ligne de temps entière ou il peut effectuer un zoom ou une panoramique pour afficher des petites périodes de la ligne de temps.

Timeline offre plusieurs options pour effectuer un zoom ou une panoramique de l'Afficheur de période de temps aux informations sélectionnées sur la ligne de temps. Les Eléments, tels que les éléments d'Occupation et d'Observation GPS, peuvent être affichés dans l'Afficheur de période de temps de deux façons:

  Sélectionnez une commande de zoom:

  Zoom avant

  Zoom arrière

  Etendue de zoom

  Vue précédente

  Zoom à l'étendue

  L'édition des champs de Période de temps pour déplacer l'Afficheur de période de temps aux zones sélectionnées de la ligne de temps.

La Règle de temps couvre la période de temps des observations, indiquée par les champs de période de temps à gauche et à droit de la Règle de temps. Lorsque la période de temps est trop grande, Timeline automatiquement effectue une panoramique de l'affichage pour afficher seulement le dernier jour.

Les éléments Timeline représentent les données collectées pendant la durée du levé. A cause du fait que la fenêtre graphique et Timeline sont liés, les données sélectionnées dans cette fenêtre sont également sélectionnées dans l'Afficheur de période de temps.

Vous pouvez afficher un menu de commandes en cliquant avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps.


    Icônes d'éphéméride

Plus amples informations

Comment ...	Dialogue	Voir aussi

Ces icônes identifient l'heure à laquelle les éphémérides diffusées ont été reçues par le récepteur pour les satellites individuels. Les informations d'éphéméride pour chaque satellite poursuivi pendant un levé sont enregistrées aux heures suivantes:

  Au début du levé (si le satellite est visible)

  Au moment que le satellite se lève au-dessus du masque d'élévation pour la première fois.

  Une fois par heure

Par défaut, le filtre pour ces icônes est désactivé lorsque Timeline s'affiche pour la première fois. Vous filtrez ces icônes en sélectionnant les commandes de la barre d'outils Timeline ou de plusieurs menus accessibles dans la zone d'affichage Timeline. Pour plus amples informations, référez-vous à Filtrage des éléments Timeline.

Vous pouvez afficher le dialogue Propriétés d'éphéméride de satellite en double cliquant sur une icône. Ce dialogue comprend des informations utiles, y compris le message de l'état de santé du satellite. Ce message sert à apprendre si le satellite contribuant des données à l'observation a été en bonne ou en mauvais santé.

Cliquant avec le bouton droit de la souris sur une icône affiche un menu de commandes ayant rapport à l'éphéméride.

Les icônes d'éphéméride ne peuvent pas être supprimées ou désactivées. Du fait que les icônes d'Ephéméride sont associées à une observation GPS, l'observation GPS, ou des zones sélectionnées des observations GPS, peuvent être désactivées pour effacer toutes les éphémérides associées des données du projet. Pour plus amples informations, référez-vous à Désactivation des observations GPS.


    Observations GPS

Plus amples informations

Comment ...	Dialogue	Voir aussi

Les éléments d'observation GPS ne s'affichent dans l'Afficheur de période de temps que lorsqu'un ou plusieurs dossiers de données sont ouverts pour afficher les données collectées pendant une session de levé.

Lorsqu'un dossier de données est ouvert, une icône de Satellite s'affiche pour chaque satellite contribuant des observations GPS au levé, et pour chaque icône, des Observations GPS représentées par des reports de poursuite de satellite s'affichent dans l'Afficheur de période de temps.

Les formes et le procédé de codification par couleurs, indiqués ci-dessous, sont utilisés dans Timeline afin de distinguer les différents types de données d'observation l'un de l'autre.

Code P L1   (Vert)	Phase L1    (Noir)	Intervalle non valide	Dérapage de cycle L1	Code C/A L1       (Rouge)
Phase complète L2 (Noir)	Code P L2   (Vert)	Dérapage de cycle L2	Code L2 encrypté	Semi-phase L2  (Noir épais)
Lors de l'évaluation des observations GPS, considérez ces lignes directrices:

  Pour les observations à monofréquence, les informations de poursuite de satellite pour le signal de porteuse L1 sont représentées comme une séquence de pixels tracée à travers l'Afficheur de période de temps.

  Pour les observations à bi-fréquence, les informations de poursuite de satellite pour les signaux des porteuses L1 et L2 sont représentées par deux séquences de pixels parallèles tracées à travers l'Afficheur de période de temps.

  Des espaces longs entre les reports de poursuite représentent les périodes pendant lesquelles le récepteur n'est pas en train de poursuivre le satellite. Des petits espaces entre les pixels représentent les dérapages de cycle et d'autres types de perte de signal de la porteuse.

  Les dérapages de cycle, les données d'intervalle non valides et d'autres types de conditions de signal de satellite fausses sont également tracés dans les lignes de pixels.

Imaginez chaque pixel dans un report de poursuite de satellite comme représentant toutes les données brutes collectées d'un satellite pendant un instant de temps. Ces données brutes comprennent:

  Le type d'observation – Phase, code C/A, code P, etc.

  La disponibilité du signal – Vrai ou faux

  L'état du signal – Valide, non valide, dérapage de cycle

  L'état Activer/Désactiver – Activer/désactiver indicateurs

Ces pixels se comportent comme des interrupteurs avec un état activé et désactivé. Si vous désactivez un pixel, les données brutes de satellite associées au pixel sont également désactivées. Activez un pixel, et les données brutes de satellite deviennent disponibles à nouveau. Ainsi, ce vous permet d'utiliser une approche par tâtonnements pendant l'édition des données d'observation GPS; vous pouvez désactiver les sélections de données et recalculer une ligne de base pour voir si des améliorations dans la qualité de données se produisent et réactiver les données si les résultats ne sont pas réussis.

En sélectionnant des petites zones de pixels; par exemple, les zones de pixels contenant des dérapages de cycle; ces zones peuvent être éditées afin d'améliorer la qualité totale des observations GPS.

ASTUCE: La sélection des zones de pixels s'effectue en faisant glisser déplacer un rectangle de sélection autour des données problématiques—tout simplement positionnez le curseur de la souris sur le coin en haut à gauche de la zone que vous voulez désactiver, maintenez le bouton gauche de la souris enfoncé et faites glisser déplacer le rectangle autour de la zone affectée.

Pour désactiver les données de la zone de pixels sélectionnée, double cliquez dans le rectangle de sélection pour afficher le dialogue Propriétés d'observation GPS . Parmi d'autres outils, ce dialogue comprend des options pour la désactivation et l'activation des données brutes de satellite pour les satellites individuels ou les sélections de satellites. Pour vous informer de plus à propos de la sélection et l'édition des éléments Timeline, référez-vous à Sélection et édition des éléments.

Plusieurs autres outils sont disponibles lors du travail avec le dialogue Propriétés d'observation GPS. Ils comprennent:

  La désactivation des données de satellite sélectionnées pour les satellites multiples

  L'édition des heures de début et de fin de la collecte de données d'observation de satellite

  L'édition de Types d'observation individuels compris dans l'observation GPS

De la barre de contrôle, vous pouvez désactiver une icône de satellite afin d'effacer toutes les informations de poursuite associées à une observation GPS d'un levé. Ce sert lorsque la santé de toutes les observations GPS associées à un satellite est mauvaise et que la constellation de satellites de l'occupation possède une redondance suffisante pour surmonter l'omission du satellite désactivé, Pour plus amples informations, référez-vous à Désactivation d'un satellite.

ASTUCE: Vous pouvez vous informer à propos de la santé des observations GPS collectées pour un satellite sélectionné en affichant les propriétés de l'icône d'éphéméride la plus récente qui s'affiche dans les reports de poursuite de satellites. Ces mises à jour d'éphéméride sont décodées par le récepteur aux intervalles d'environ 1 heure et comprennent un message indiquant la santé courante de chaque satellite. Les champs URA et Indicateur URA servent également pour l'évaluation de la qualité totale des émissions des satellites.

Vous pouvez cliquer avec le bouton droit de la souris n'importe où dans l'élément d'observation GPS pour afficher un menu de commandes pour travailler avec les données d'Observation GPS.

Il n'est pas possible de supprimer les observations GPS, mais une observation GPS entière ou des zones sélectionnées peuvent être désactivées. Il est également possible de désactiver les satellites afin de désactiver tous les types d'observation GPS associés tracés sur la ligne de temps.


    Eléments de segment de données/occupation

Plus amples informations

Comment ...	Dialogue	Voir aussi

Les Occupations et les Segments de données représentent une période de temps pendant laquelle les observations GPS sont collectées par un récepteur. Ils peuvent être classifiés en deux types:

  Les Occupations statiques, qui comprennent les occupations Statique rapide et Arrêt et Marche. Une Occupation représente une période de temps pendant laquelle un récepteur est immobile à un point.

  Les Segments continus, qui comprennent les Segments mobiles. Un Segment mobile ou continu représente une période de temps pendant laquelle un récepteur est mobile mais réalise la collecte de mesures encore.

Procédé de codification par couleurs

Les périodes de Segment de données et d'Occupation sont représentées par des zones rectangulaires codifiées par couleurs indiquant la période de temps pendant laquelle les données d'occupation ont été collectées. Ces codifications par couleurs et ces formes sont utilisées pour identifier les différents types d'informations:

  Les occupations Statique et Statique rapide s'affichent sous forme des grandes zones rectangulaires bleues.

  Les occupations Arrêt et Marche s'affichent sous forme des petites zones rectangulaires bleues.

  Les Segments continus s'affichent sous forme des grands éléments rectangulaires verts.

  Les Segments mobiles s'affichent sous forme des petits éléments rectangulaires verts.

  Les Segments avec des erreurs s'affichent sous forme des éléments rouges.

Reports de constellation de satellites

Il est possible d'afficher deux reports concernant la constellation de satellites pour la période d'occupation ou le segment lorsqu'une occupation ou un segment continu est sélectionné. Pour plus amples informations, référez-vous aux rubriques:

  Report DOP

  Plan du ciel

Lignes pointillées

Une ligne pointillée représente des zones où les mesures GPS sont disponibles, mais il n'y a aucun élément de Segment ou d'Occupation associé à ces mesures.

Les segments mobiles ne sont pas importés dans la base de données par défaut. Ils ne peuvent être créés que par la conversion d'un Segment continu à un Segment mobile. Lorsque les données sont importées dans TGO d'un fichier DAT la case à cocher Utiliser pour tous les Segments mobiles est vide.

Si la case à cocher reste vide, le Segment mobile n'est pas chargé dans le projet et la ligne pointillée est utilisée pour indiquer qu'il y a des mesures GPS disponibles pour cette période de temps, mais qu'il n'y a aucun élément de Segment ou d'Occupation associé à ces observations.

Si la case à cocher est sélectionnée, le Segment mobile sera converti à Continu, et un segment continu s'affichera dans Timeline. La seule méthode d'obtenir un Segment mobile est de changer le Segment continu à mobile.

Lignes directrices supplémentaires

Considérez ces lignes directrices lors du travail avec les occupations et les segments de données:

  Toutes les propriétés de segment de données et d'occupation peuvent être affichées en double cliquant sur l'occupation ou le segment de données.

  Il est possible d'ajuster la période de temps directement en faisant glisser déplacer le bord gauche et droit du rectangle.

  Une Occupation statique peut être changée à un Segment mobile ou un Segment continu en sélectionnant le type approprié du dialogue Propriétés de Segment de données/Occupation.

  Il est possible de supprimer les Occupations et les Segments. Cependant, une fois supprimés ils ne sont plus accessibles du projet.

  Les commandes Suivant et Précédent, également représentées comme des touches de direction bleues sur la barre d'outils, sont utilisées pour déplacer l'Afficheur de période de temps à l'occupation suivante ou précédente ou le point de début ou de fin du segment trouvé dans dossier de données.


     Icônes de satellite

Plus amples informations

Comment ...	Dialogue	Voir aussi

Les icônes de satellite représentent les satellites qui contribuent des mesures GPS au Levé. Le numéro PRN du satellite est imprimé sur chaque icône pour l'identification.

Les icônes de satellite sont masquées lorsque Timeline s'affiche pour la première fois. Pour révéler les satellites, ouvrez un ou plusieurs dossiers de données dans la barre de contrôle.

Un signe de moins indique que le dossier est ouvert
	Icône de satellite
Les icônes de satellite dans la barre de contrôle ont une correspondance univoque avec les Observations GPS s'affichant dans l'Afficheur de période de temps , l'icône indique le numéro du satellite et les observations GPS affichent les périodes d'activité d'émission des satellites correspondantes.

Cliquez avec le bouton droit de la souris sur une de ces icônes pour afficher un menu de commandes. Utilisez la commande Activer/Désactiver pour activer ou désactiver les observations GPS associées qui s'affichent dans l'Afficher de période de temps. Cette caractéristique sert à effacer des informations de satellite d'une occupation. Lorsque désactivés, les reports de poursuite de satellites correspondants sont codifiés par couleurs avec des teintes claires pour indiquer leur état désactivé. Utilisez cette commande lorsque la santé du satellite est suspecte.  Par exemple, il se peut que vous voulez désactiver un satellite sélectionné afin de déterminer si les résultats de traitement de lignes de base s'amélioreront.

ASTUCE: Vous pouvez également désactiver des zones  sélectionnées d'une observation GPS. Par exemple, vous pouvez désactiver une zone contenant un dérapage de cycle ou des donnés de phase non valides.  Pour plus amples informations, référez-vous à Observations GPS.

Double cliquez sur une icône de satellite pour afficher la fenêtre Report SV avec les commandes pour le traçage des informations brutes de poursuite de satellite collectées du satellite. Le report SV également offre une option pour l'exportation des données brutes de satellite vers un fichier sous format tabulaire.

Il est également possible de réorganiser les icônes de satellite dans un dossier de données en faisant glisser déplacer les icônes aux nouvelles positions dans le dossier. Ce sert lors de la sélection de plusieurs satellites avant l'édition des propriétés d'observation GPS.


    Occupations statiques

Plus amples informations

Comment ...	Dialogue	Voir aussi
Les occupations statiques représentent les périodes de temps pendant lesquelles le récepteur a resté immobile pendant la collecte de données à un point. Les données collectées identifient la position exacte du point et l'heure à laquelle les données ont été collectées.

Les occupations statiques s'affichent comme un grand rectangle bleu. La longueur du rectangle représente la période de temps pendant laquelle les données ont été collectées. Une icône de Station s'affiche au bord principal de l'occupation, indiquant que l'occupation a été statique.

Double cliquez sur une Occupation statique pour afficher ses propriétés. Ces propriétés affichent les informations de segment et d'antenne.

Vous pouvez cliquez avec le bouton droit de la souris n'importe où dans l'élément d'Occupation statique pour afficher un menu de commandes pour travailler avec les données d'Occupation.

L'élément d'Occupation statique peut être ajusté pour changer la période de temps. Les Occupations statiques peuvent être changées à un Segment mobile ou un Segment continue en sélectionnant le type approprié de la liste Type d'occupation dans le dialogue Propriétés de Segment de données/Occupation .

A cause du fait que la fenêtre graphique et Timeline sont liées, les occupations de points et de lignes de base sélectionnées dans la fenêtre graphique sont également sélectionnées dans Timeline et vice versa. Par exemple, vous pourrez sélectionner une Occupation statique dans Timeline pour afficher ses points et sa ligne de base associés dans la fenêtre graphique. Une fois que les points ou la ligne de base sont sélectionnés, vous pouvez afficher leurs propriétés afin de vous informer de plus à propos de l'occupation..

Il est possible d'afficher deux reports à propos de la constellation de satellites pour la période d'occupation ou le segment lorsqu'une occupation ou un segment continu est sélectionné. Pour plus amples informations, référez-vous aux rubriques:

  Report DOP

  Plan du ciel

ASTUCE: La fenêtre Propriétés, accédée de la fenêtre graphique, sert également pour naviguer à travers Timeline pour trouver des occupations sélectionnées. Les occupations de points et de lignes de base sélectionnées de ce dialogue sont également sélectionnées dans Timeline. Une fois sélectionné, vous pouvez double cliquer sur l'élément d'occupation dans Timeline pour lire ses propriétés.

Les éléments de Segment et d'Occupation sont affichés dans des rectangles codifiés par couleurs pour une identification facile. Pour plus amples informations, référez-vous à Procédé de codification de l'occupation par couleurs.


     Eléments de Levé

Plus amples informations

Comment ...	Dialogue

Dans l'Afficheur de période de temps se trouve un ou plusieurs éléments de Levé rectangulaires. Ces éléments de Levé sont associés à un dossier de données qui s'affiche dans la barre de contrôle. Chaque dossier de données représente un récepteur unique et contient des informations pour un ou plusieurs Levés,  qui sont en principe des fichiers avec les mesures GPS.

Le bord avant d'un élément de Levé identifie l'heure de début quand la session de Levé a commencé et le bord arrière identifie l'heure de fin. Lorsqu'un élément de Levé unique est contenu dans le dossier de données dans la barre de contrôle, cet élément de Levé couvre la longueur entière de la ligne de temps. Etant donné que de nombreux Levés collectés pendant plusieurs jours pourraient être compris dans un projet, un élément de Levé typique n'occupe qu'une petite partie de la ligne de temps entière.

Vous pouvez double cliquer sur un élément de Levé pour afficher et éditer ses propriétés.

Vous pouvez cliquer avec le bouton droit de la souris n'importe où dans l'élément de Levé pour afficher un menu de commandes pour travailler avec les données de Levé.

Les éléments de levé peuvent être supprimés. Du fait que les éléments de Levé représentent les données actuelles, les données associées sont également supprimées du projet. Les éléments de levé supprimés s'affichent dans l'Afficheur de période de temps sous forme de zones rectangulaires blanches entourées d'une bordure noire. Ces zones vous informent que les données de levé ont existé dans cette zone de la ligne de temps.


    Eléments Timeline - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Timeline utilise des éléments graphiques pour représenter les données de levé GPS s'affichant  dans l'Afficheur de période de temps.

	Dossier de données	Levé	Icône d'éphéméride
	Icône de satellite	Occupation	Observation GPS
Ces éléments peuvent être sélectionnées et les propriétés de données associées peuvent être éditées. Lorsqu'approprié, la période de temps des données collectées peut être éditée, les informations de poursuite de satellite sélectionnées peuvent être désactivées, et les éléments de levé et d'occupation peuvent être supprimés. Les actions effectuées sur ces éléments ont un effet sur leurs données de projet associées. Ces actions peuvent améliorer la qualité des données de levé en supprimant les données problématiques ayant un effet sur la qualité totale des observations GPS.

Lecture des info-bulles d'élément

Les Info-bulles suivants s'affichent lorsque le pointeur de la souris est positionné sur un élément Timeline:

Lorsque le pointeur est positionné sur …	Un Info-bulle affiche …
un élément de levé	le nom du fichier de données associé à l'élément
une occupation ou un élément de segment de données	le nom de la station associée à l'occupation
une observation GPS	le numéro du véhicule spatial associé aux informations de poursuite
une icône d'Ephéméride	le numéro du véhicule spatial associé à la mise à jour de l'éphéméride
une icône de satellite ou un dossier de données	le modèle de récepteur et le numéro de série
Pour plus amples informations au sujet de ces éléments, référez-vous aux rubriques:

  Levés

  Occupations

  Icônes de Station

  Observations GPS

  Icônes d'éphéméride

  Icônes d'événement


    Barres d'outils Timeline

Plus amples informations

 Voir aussi

Deux barres d'outils s'affichent lorsque la zone d'affichage Timeline s'affiche—la barre d'outils Timeline et la barre d'outils Planification de reports. Ces deux barres d'outils vous fournissent d'accès rapide aux commandes Timeline utilisées fréquemment.

Pour vous informer de plus à propos des barres d'outils Timeline, référez-vous aux rubriques:

  Barre d'outils Timeline

  Barre d'outils Planification de reports


    Zone d'affichage Timeline - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Timeline devient disponible après l'importation d'un ou plusieurs fichiers ayant des mesures GPS dans votre projet de logiciel Trimble Geomatics Office. Vous devez également être en train de travailler dans Vue de levé.

Pour accéder à Timeline:

1.	Ouvrez un projet contenant des fichiers de données brutes GPS.

2.	Effectuez l'une des choses suivantes:

  Sélectionnez Affichage / Timeline.

  Appuyez sur Alt+VI.

La zone d'affichage Timeline s'affiche en bas de la fenêtre graphique.

La Timeline est divisée en trois zones d'affichage:

	Règle de temps
Barre de contrôle	Afficheur de période de temps
Ces trois zones sont interconnectées. La Règle de temps contrôle la quantité des informations de levé ayant rapport au temps s'affichant dans l'Afficheur de période de temps, et la barre de contrôle contrôle la quantité des informations brutes de satellite qui s'affichent dans l'Afficheur de période de temps.

Il faut imaginer l'Afficheur de période de temps comme une loupe; il peut afficher la ligne de temps entière ou il peut effectuer un zoom ou une panoramique pour afficher des petites périodes dans la ligne de temps. Timeline offre plusieurs options pour effectuer un zoom ou une panoramique des information qui s'affichent dans  l'Afficheur de période de temps. Du fait que Timeline et la fenêtre graphique sont également liés, les données sélectionnées dans la fenêtre graphique sont également sélectionnées dans l'Afficheur de période de temps.

Deux autres modifications se produisent lorsque Timeline est active; des barres d'outils supplémentaires deviennent disponibles et la barre d'état affiche des informations Timeline.

La Zone d'affichage Timeline peut être imprimée en mode portrait ou paysage. Pour plus amples informations, référez-vous à Impression de la zone d'affichage Timeline.

Pour vous informer de plus à propos de Timeline, référez-vous aux rubriques:

  Barres d'outils

  Règle de temps

  Barre de contrôle

  Afficheur de période de temps

  Eléments Timeline


     Règle de temps

Plus amples informations

Comment ...	Dialogue	Voir aussi

La Règle de temps et l'Afficheur de période de temps sont liés et travaillent ensemble; tout changement dans la période de temps est reflété dans les deux fenêtres.

Il faut imaginer la Règle de temps et l'Afficheur de période de temps comme une loupe; vous pouvez effectuer un zoom ou une panoramique aux zones sélectionnées dans l'Afficheur de période de temps. Il se peut que la ligne de temps couvre plusieurs heures ou plusieurs jours et qu'elle comprend beaucoup d'occupations. Ces deux fenêtres travaillent ensemble pour afficher la ligne de temps entière ou des petites périodes de celle-ci. Tout changement dans une fenêtre est reflété dans l'autre.

	Champ Heure de début	Champ Heure de fin
	Règle
Vous pouvez éditer les champs Heure de début et Heure de fin ou effectuer un zoom de l'Afficheur de période de temps, selon vos exigences immédiates. Considérez ces actions:

  Editez les champs Heure de début et Heure de fin pour effectuer un zoom  de l'Afficheur de temps lorsque vous devez étudier les données d'observations des périodes de temps connues. Par exemple, il se peut que vous voulez faire un zoom sur une période de temps quand les résidus hauts d'observation ont l'effet de rejeter une solution de ligne de base.

  Utilisez la commande Zoom à l'étendue lorsqu'il faut effectuer un zoom sur un élément particulier dans Timeline. Par exemple il se peut que vous voulez étendre un Segment continu cinématique afin de remplir  l'Afficheur de période de temps.

  Utilisez la commande Etendue de zoom lorsque vous voulez afficher la ligne de temps entière dans l'Afficheur de période de temps. Ce sert lorsqu'il y a plusieurs fichiers de données compris dans le projet et que vous avez besoin d'établir un rapport entre les diverses périodes de temps pendant lesquelles les données de levé ont été collectées.

  Utilisez la commande Zoom avant pour mettre à l'échelle les données dans l'Afficheur de période de temps par incréments de 200%. Cette commande sert lorsque vous voulez faire un zoom avant sur une petite partie d'une observation GPS afin d'afficher des intervalles dans les émissions de poursuite de satellites ou les dérapages de cycle.

  Utilisez la commande Zoom arrière pour mettre à l'échelle les données dans l'Afficheur de période de temps par incréments de 50%. Utilisez cette commande lorsque vous avez besoin d'afficher plus de la zone d'observation GPS. Ce sert lorsque vous essayez de déterminer si un satellite peut être désactivé ou non—il se peut que vous devez savoir s'il y a une redondance suffisante dans la constellation de satellites pour désactiver un satellite. Un zoom arrière vous permet d'afficher combien de satellites ont été poursuivis pendant la période de temps.

  Utilisez la commande Vue précédente pour retourner au grossissement précédent. Cette commande sert pour retourner au niveau de zoom précédent après avoir effectué un zoom avant ou un zoom arrière d'une occupation ou d'une observation GPS.

La Règle de temps peut afficher deux types d'unité de l'heure:

  L'heure locale Windows

  Semaine/secondes GPS

Vous pouvez afficher le dialogue Options d'heure pour changer les unités. Utilisez l'heure locale Windows lorsqu'il est plus facile d'établir un rapport entre les périodes temps et intervalles de temps quotidiens, tels que les dates sur un calendrier ou l'heure sur votre horloge. Utilisez Semaine./secondes GPS lorsque vous avez besoin de corréler vos périodes de temps avec des données ou des événements GPS. Vous pouvez changer rapidement entre les unités de l'heure en utilisant quelques clics avec la souris.

Les modifications aux unités de l'heure sont reflétés dans tous les affichages et les  dialogues de propriétés Timeline et vous pouvez cliquer avec le bouton droit de la souris sur la Règle de temps pour afficher un menu de commandes pour travailler avec la Règle de temps.

Pour plus amples informations, référez-vous aux rubriques:

  Barres d'outils

  Barre de contrôle

  Afficheur de période de temps

  Eléments Timeline

  Dialogues de propriétés Timeline

  Affichages Timeline


     Icônes de station

Plus amples informations

Comment ...	Voir aussi
Utilisez ces petites icônes triangulaires rouges et les étiquettes pour identifier les Occupations statiques.

NOTE: Les Icônes de station ne peuvent pas être supprimées ou désactivées—elles ne sont supprimées ou désactivées qu'avec leur occupation parente.


     Icônes d'événement

Plus amples informations

Comment ...	Voir aussi
Ces icônes identifient les événements générés par le système ainsi que les événements générés manuellement qui se produisent pendant les sessions d'enregistrement de données de levé. Les icônes d'événement ne s'affichent que dans l'Afficheur de période de temps et se présentent sous forme des losanges centrés à l'heure à laquelle l'événement s'est produit.

Les icônes d'événement peuvent être filtrées afin d'afficher ou masquer les icônes en cliquant sur [image] dans la barre d'outils Timeline.


     Menus Timeline - Vue d'ensemble

Plus amples informations

Vue d'ensemble

Les menus Timeline peuvent être utilisés pour accéder rapidement aux commandes dans la Zone d'affichage Timeline. Chaque menu s'affiche lorsqu'un élément ou une fenêtre Timeline est sélectionné et vous cliquez avec le bouton droit de la souris.

Les menus suivants sont disponibles:

  Règle de temps

  Champ de période de temps

  Dossier de données

  Observations GPS

  Afficheur de période de temps

  Levé

  Occupation

  Icône de satellite

  Icône d'éphéméride


     Menu Règle de temps

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes Règle de temps:

Pour  y accéder, effectuez l'une des choses suivantes:

  Double cliquez sur l'arrière plan de la Règle de temps

  Cliquez avec le bouton droit de la souris sur l'arrière plan de la Règle de temps

Un menu s'affiche avec les commandes suivantes:

  Options d'heure

  Etendue de zoom

  Vue précédente


     Menu Champ de période de temps

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes du Champ de période de temps.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur le champ Heure de début ou Heure de fin.

Un menu s'affiche avec les commandes suivantes:

  Annuler

  Couper

  Copier

  Coller

  Supprimer

  Sélectionner tout


     Menu Barre de contrôle

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes de la barre de contrôle. Les menus de Zone d'affichage Timeline doivent être visibles pour accéder à ce menu.

Pour y accéder:

  Cliquez avec le bouton droit de la souris n'importe où dans la barre de contrôle.

Le menu s'affiche avec les commandes suivantes:

  Agrandir tout

  Réduire tout

  Etendue de zoom

  Vue précédente


     Menu Icône de satellite

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes de l'Icône de satellite.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur toute Icône de satellite.

Un menu s'affiche avec les commandes suivantes:

  Activer/Désactiver

  Report SV


     Menu Afficheur de période de temps

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes de l'Afficheur de période de temps.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur l'arrière-plan de l'Afficheur de période de temps.

Un menu s'affiche avec les commandes suivantes:

  Filtres d'affichage

  Suivant

  Précédent

  Etendue de zoom

  Vue précédente


     Menu Levé

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes de l'Intervalle de levé.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur un élément de Levé.

Un menu s'affiche avec les commandes suivantes:

  Supprimer

  Info d'éphéméride

  Zoom à l'étendue

  Etendue de zoom

  Vue précédente

  Propriétés


     Menu Occupation statique

Plus amples informations

 Voir aussi

Utilisez cette commande pour accéder rapidement aux commandes d'Occupation statique.

NOTE: L'Occupation statique doit être visible dans l'Afficheur de période de temps pour accéder à ce menu. D'abord, affichez Timeline, puis ouvrez le dossier de données contenant les données d'occupation.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur un élément d'Occupation statique.

Un menu s'affiche avec les commandes suivantes:

  Supprimer

  Info d'éphéméride

  Zoom à l'étendue

  Etendue de zoom

  Vue précédente

  Propriétés


     Menu Observation GPS

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes d'Observation GPS.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur un élément d'Observation GPS  ou un rectangle de sélection entourant une zone d'une Observation GPS.

Un menu s'affiche avec les commandes suivantes:

  Activer/Désactiver

  Info d'éphéméride

  Zoom à l'étendue

  Etendue de zoom

  Vue précédente

  Propriétés


     Menu Ephéméride

Plus amples informations

 Voir aussi

Utilisez ce menu pour accéder rapidement aux commandes pour travailler avec les informations d'éphéméride.

Pour y accéder:

1.	Si nécessaire, ouvrez un dossier de données.

Le dossier est ouvert, montrant les Icônes de satellite.

2.	Si nécessaire, activez le filtre de Satellite.

Les Observations GPS s'affichent.

Par défaut, le filtre de Satellite est activé.

3.	Si nécessaire, activez le filtre d'éphéméride.

Les icônes d'Ephéméride s'affichent.

4.	Cliquez avec le bouton droit de la souris sur l'icône d'Ephéméride requise.

Le menu s'affiche avec les commandes suivantes:

  Zoom à l'étendue

  Etendue de zoom

  Vue précédente

  Propriétés


     Dossiers de données

Plus amples informations

Comment ...	Dialogue	Voir aussi
Un Dossier de données représente un seul récepteur. Le type et le numéro de série du récepteur qu'il représente sont affichés sur le dossier. Les projets de Levé auront deux ou plusieurs Dossiers de données, un pour chaque récepteur utilisé dans le projet.

Chaque Dossier de données contient des informations pour un ou plusieurs Levés. Un Levé correspond à un seul fichier ayant des mesures GPS.

Ouvrez et fermez les dossiers de données pour afficher ou masquer les Icônes de satellite dans la barre de contrôle et les Observations GPS associées dans l'Afficheur de période de temps.

Le signe plus indique que le dossier est fermé
	Modèle de récepteur et numéro de série
Le signe moins indique que le dossier est ouvert

	Icône de satellite

Vous pouvez ouvrir ou fermer les dossiers de deux façons:

  Un signe plus (+) s'affiche au côté gauche du dossier de données lorsqu'il est fermé et un signe moins s'affiche lorsqu'il est ouvert. Vous pouvez cliquer sur les symboles plus (+) et moins (-) pour ouvrir et fermer des dossiers individuels.

  Les commandes Agrandir tout et Réduire tout peuvent être accédées de plusieurs façons pour ouvrir ou fermer tous les dossiers de données dans la barre de contrôle.

Lorsque un dossier est ouvert, une Icône de satellite s'affiche pour chaque satellite contribuant des observations GPS au levé, et pour chaque icône, des Observations GPS représentées par des reports de poursuite de satellite s'affichent dans l'Afficheur de période de temps.

  Pour les observations à monofréquence, les informations de poursuite de satellites pour le signal de porteuse L1 sont représentées comme une séquence de pixels tracée à travers l'Afficheur de période de temps.

  Pour les observations à bi-fréquence, les informations de poursuite de satellites pour les signaux de porteuse L1 et L2 sont représentées par deux séquences de pixels parallèles à travers l'Afficheur de période de temps.

Les Propriétés de récepteur sont affichées lorsque vous double cliquez sur un dossier de données. Si vous cliquez avec le bouton droit de la souris sur un dossier, un menu de commandes pour travailler avec les données dans le dossier s'affichera.

Plusieurs actions peuvent être effectuées sur les Icônes de satellite et les Observations GPS révélées lorsqu'un dossier de données est ouvert. Pour des illustrations montrant les divers éléments Timeline s'affichant dans la barre de contrôle et l'Afficheur de période de temps, référez-vous à Eléments Timeline.


     Barre de contrôle Timeline

Plus amples informations

Comment ...	Dialogue	Voir aussi

Utilisez la barre de contrôle pour gérer les informations des observations GPS affichées dans l'Afficheur de période de temps.

La barre de contrôle se trouve dans le coin en bas à gauche de la zone d'affichage Timeline. Les actions effectuées dans la barre de contrôle sont reflétées dans l'Afficheur de période de temps.

De la barre de contrôle vous pouvez effectuer les actions suivantes:

  Ouvrir et fermer les dossiers de données

  Activer et désactiver les icônes de Satellite et leurs Observations GPS correspondantes

  Afficher Propriétés de récepteur

  Afficher un Report SV pour afficher les informations brutes de poursuite de satellites émises par les satellites individuels

Utilisez le menu de barre de contrôle pour accéder aux commandes associées aux données actuellement affichées dans Timeline. Le menu Icône de satellite sert à activer et désactiver les observations GPS associées aux satellites individuels. Vous pouvez également l'utiliser pour démarrer l'affichage Report SV, avec des options pour le traçage des informations brutes de poursuite de satellites pour les satellites individuels.

Pour plus amples informations, référez-vous aux rubriques:

  Barres d'outils

  Règle de temps

  Afficheur de période de temps


     Menu Segment continu

Plus amples informations

 See also

Ouvrez ce menu pour accéder rapidement aux commandes de Segment continu.

NOTE: Le Segment continu doit être visible dans l'Afficheur de période de temps pour accéder à ce menu. D'abord, affichez Timeline, puis ouvrez le dossier de données contenant les données continues.

Pour y accéder:

  Cliquez avec le bouton droit de la souris sur Segment continu.

Un menu s'affiche avec les commandes suivantes:

  Supprimer

  Info d'éphéméride

  Zoom à l'étendue

  Etendue de zoom

  Vue précédente

  Propriétés


     Barre d'outils Timeline

Plus amples informations

 Voir aussi

Cette barre d'outils s'affiche dans la zone de barre d'outils lorsque la Timeline s'affiche.

Cette barre d'outils s'affiche automatiquement lorsque la Timeline est démarrée. Vous pouvez masquer la barre d'outils en sélectionnant Affichage / Barres d'outils / Timeline et l'afficher à nouveau en répétant cette commande.

Les boutons suivants sont disponibles:

	Sélectionnez ce bouton pour filtrer l'Icône de station rouge de forme triangulaire et les étiquettes associées aux occupations. Les Stations s'affichent dans l'Afficheur de période de temps, au bord avant ou au point de début d'un élément d'Occupation . Lorsque vous double cliquez sur une Icône de station, les propriétés d'occupation de la station s'affichent avec les informations de résumé concernant la station.
	Sélectionnez ce bouton pour filtrer les icônes d'événement en forme de losange s'affichant dans l'Afficheur de période de temps.
	Sélectionnez ce bouton pour filtrer les segments continus. Ces segments sont collectés par des récepteurs mobiles et n'ont aucune station initiale. Cliquez sur le bouton une fois pour masquer les segments et encore une fois lorsque vous voulez les afficher.
	Sélectionnez ce bouton pour filtrer les Observations GPS collectées par les satellites. Cliquez sur ce bouton une fois pour masquer toutes les observations GPS, et cliquez-le à nouveau lorsque vous voulez les afficher.
	Sélectionnez ce bouton pour filtrer les icônes d'éphéméride dans l'Afficheur de période de temps. Cliquez sur le bouton une fois pour afficher les icônes et cliquez-le à nouveau lorsque vous voulez les masquer.
	Sélectionnez ce bouton pour ouvrir tous les dossiers de données fermés dans la barre de contrôle. Les Icônes de satellite et les Observations GPS pour tous les satellites dans les dossiers de données sont visibles lorsque vous appuyez sur ce bouton.
	Sélectionnez ce bouton pour fermer tous les dossiers de données ouverts dans la barre de contrôle. Les icônes de satellite et les observations GPS pour tous les satellites dans les dossiers de données sont masquées.
	Sélectionnez ce bouton pour faire une panoramique avec l'Afficheur de période de temps à l'élément de Levé précédent. Chaque fois que vous appuyez sur ce bouton, l'élément de Levé précédent est sélectionné. En particulier, ce bouton sert pour faire une panoramique rapide de Levé à Levé sans utiliser les barres de défilement.
	Sélectionnez ce bouton pour faire une panoramique avec l'Afficheur de période de temps à l'élément de Levé suivant. Ce bouton n'est disponible que lorsqu'un dossier de données est sélectionné. Chaque fois que vous appuyez sur ce bouton, l'élément de Levé suivant est sélectionné. En particulier, ce bouton sert pour faire une panoramique rapide de Levé à Levé sans utiliser les barres de défilement..


     Barre d'outils Planification de report

Plus amples informations

 Voir aussi

Utilisez cette barre d'outils pour exécuter les commandes pour l'affichage des informations brutes de satellites et d'éphéméride émises.

Cette barre d'outils s'affiche automatiquement lorsque la Timeline est démarrée. Vous pouvez masquer la barre d'outils en sélectionnant Affichage / Barres d'outils / Planification de report et l'afficher à nouveau en répétant cette commande.

Les boutons suivants sont disponibles:

	Sélectionnez ce bouton pour afficher Report DOP. Ce bouton n'est disponible qu'après la sélection d'une occupation.
	Sélectionnez ce bouton pour afficher le Plan du ciel d'une occupation. Ce bouton n'est disponible qu'au temps de sélectionner une occupation.
	Sélectionnez ce bouton pour afficher le Report SV pour un satellite sélectionné. Ce bouton n'est disponible que lorsqu'une icône de satellite est sélectionnée d'un dossier de données.


     Champs d'édition de la période de temps

Plus amples informations

Comment ...	Voir aussi

Utilisez les champs Heure de début et Heure de fin dans la Règle de temps pour faire une panoramique avec l'Afficheur de période de temps à une période de temps sélectionnée.

Editez les champs Heure de début et Heure de fin pour faire une panoramique avec l'Afficheur de période de temps lorsque vous avez besoin d'étudier les données d'observation pour une période de temps connue. Par exemple, il se peut que vous voulez faire une panoramique à la période de temps où une station spécifique se trouve sur la ligne de temps.

Pendant l'édition de ces champs, vous pouvez cliquer avec le bouton droit de la souris sur ces champs pour afficher menu et utiliser les commandes de presse-papiers pour couper, copier, coller et annuler de texte.


     Reports de constellation de satellites - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi

Vue d'ensemble

Timeline peut produire les affichages graphiques avec des informations concernant la constellation de satellite. Ces affichages sont basés sur les informations d'éphéméride courantes au temps de l'occupation.

Ils comprennent:

  Report DOP

  Plan du ciel

Ces affichages ne sont disponibles que lorsqu'un élément d'Occupation est sélectionné. Une occupation est nécessaire afin d'obtenir les coordonnées d'un point à partir duquel la visibilité du satellite est calculée.


     Report DOP

Plus amples informations

Comment ...	Voir aussi

Utilisez ce report pour afficher le nombre de satellites et la Dilution de précision (DOP), une mesure de la qualité attendue pour la position GPS basée sur la géométrie du satellite, pendant la période d'observation. Les informations utilisées pour dériver cet affichage sont basées sur les informations d'éphéméride courantes au temps de l'occupation.

Pour afficher un Report DOP d'une occupation, effectuez l'une des choses suivantes:

  Cliquez avec le bouton droit de la souris sur l'occupation dans Timeline et sélectionnez Info d'éphéméride / Report DOP.

  Dans la barre d'outils Planification de report, cliquez sur [image].

Le Report DOP s'affiche.

La DOP est une mesure scalaire de la qualité de la géométrie de la constellation de satellites. Les valeurs DOP plus basses indiquent une géométrie plus forte et les valeurs plus hautes indiquent une géométrie plus faible. En général, la DOP est plus basse et la géométrie est plus forte lorsque plus de satellites sont visibles. Le Report de nombre de satellites indique le nombre de satellites visibles par rapport à la période d'observation.

L'heure du jour et votre position ont un effet sur la DOP. Du fait que les périodes de DOP plus basse et la bonne géométrie de satellite sont prévisibles en utilisant un logiciel de planification, il est possible de programmer les observations pour les parties du jour pendant lesquelles les conditions sont les plus favorables.

NOTE: Le nombre de satellites et les calculs DOP ne sont basés que sur l'éphéméride courante au temps de l'occupation. Ces affichages ne reflètent pas nécessairement les conditions de poursuite actuelles, et donc ils peuvent afficher plus de satellites que ceux en fait poursuivis. Ce peut être à cause des obstructions au site, qui ne sont pas tenues en compte lors de la création de ces affichages.


     Plan du ciel

Plus amples informations

Comment ...	Voir aussi

Utilisez cet affichage pour afficher un report local (de l'horizon) en deux dimensions de la constellation de satellites visible d'un emplacement sélectionné. Les informations utilisées pour dériver le Plan du ciel sont basées sur les informations d'éphéméride courantes au temps de l'occupation.

Pour afficher un affichage Plan du ciel, effectuez l'une des choses suivantes:

  Cliquez avec le bouton droit de la souris sur un élément d'Occupation dans Timeline, et sélectionnez Info d'éphéméride / Report DOP.

  Dans la barre d'outils Planification de reports, cliquez sur [image].

L'horizon local sur le Plan du ciel est affichée en fonction de l'azimut et l'élévation.

Déplacez le curseur de la souris à travers le report pour afficher les données de poursuite de satellites dans la barre d'état. La barre d'état identifie le satellite et indique l'heure, l'azimut et l'élévation du point de données le plus près au curseur de la souris.

Au début de l'occupation, la constellation de satellites initiale est soulignée avec des petits carrés autour des points de données. Pour ce point du temps, le nombre de satellites et la DOP sont affichés. Vous pouvez mettre à jour ces données.

NOTE: Le Plan du ciel n'est basé que sur l'éphéméride courante au temps de l'occupation. Cet affichage ne reflète pas nécessairement les conditions de poursuite actuelles, et donc il peut afficher plus de satellites que ceux en fait poursuivis. Ce peut être à cause des obstructions au site, qui ne sont pas tenues en compte lors de la création du Plan du ciel.


     Contenu Timeline

Contenu

Les rubriques d'aide suivantes sont disponibles:

Pour vous informer de comment utiliser Timeline, lisez les rubriques détaillées ci-dessus:

  Quand et pourquoi utiliser Timeline

  Zone d'affichage Timeline

  Eléments Timeline

  Dialogues  de Propriétés de données Timeline

  Menus Timeline

  Commandes Timeline

  Affichages d'éphéméride et satellites Timeline

Pour l'Aide sur Aide, appuyez sur F1.


    Timeline - Vue d'ensemble

Plus amples informations

Dialogue	Voir aussi
Vue d'ensemble

Timeline affiche les informations du projet GPS (telles que les informations brutes de satellite et de levé collectées par les récepteurs ou les carnets de terrain de Trimble) dans un format d'heure graphique. Chaque pièce d'information est représentée par des éléments graphiques à sa position appropriée sur une ligne de temps. Timeline n'est disponible que dans la Vue de levé.

Pour l'afficher:

  Sélectionnez Affichage / Timeline.

Utilisez Timeline pour:

  afficher les reports détaillés des observations de satellites

  désactiver les données de satellite sélectionnées

  éditer sélectivement les données fausses d'observation GPS

  éditer les données de propriétés associées aux éléments

  ajuster les temps d'occupation utilisés dans le traitement de lignes de base

Une fois que Timeline s'affiche, vous pouvez sélectionnez les éléments graphiques et étudier, vérifier et éditer les données associées à ces éléments.

Pour plus amples informations, lisez ces rubriques:

  Quand et pourquoi utiliser Timeline

  Zone d'affichage Timeline

  Eléments Timeline

  Dialogues de Propriétés de données Timeline

  Affichages d'éphéméride et satellites Timeline


     Quand et pourquoi utiliser Timeline

Plus amples informations

Comment ...	Dialogue	Voir aussi

Utilisez Timeline pour étudier, vérifier, et éditer vos informations de projet GPS. Vous pouvez utiliser Timeline après avoir transféré les fichiers de données brutes GPS à votre logiciel Trimble Geomatics Office. Si vous voulez étudier les données GPS collectées dans les fichiers avant de traiter les lignes de base, ou éditer les informations d'antenne, utilisez Timeline pour vérifier les données. Timeline est très utile après le traitement de lignes de base si le traitement a produit des résultats inattendus. Vous pouvez utiliser Timeline pour trouver des données problématiques et pour éditer les données afin d'améliorer leur qualité.

Utilisez Timeline pour étudier les informations de levé GPS pour les conditions suivantes:

  Les dérapages de cycle de signal de satellite et d'autres problèmes de signal

  La mauvaise santé de satellite

  La mauvaise redondance dans les constellations de satellite

  Les périodes de mauvaise DOP (Dilution de précision)

  Les problèmes de mesure d'antenne

  Les problèmes de temps parmi des fichiers de données de levé multiples

Utilisez Timeline pour effectuer les tests suivants par tâtonnements:

  Ajuster les périodes de temps de collecte de données

  Désactiver et activer les informations de poursuite de satellites

Utilisez les actions Timeline suivantes pour améliorer la qualité des données:

  Ajuster les temps d'occupation

  Désactiver les satellites malsains afin d'améliorer les résidus d'observation totaux.

  Editer sélectivement les données fausses d'observation GPS

  Supprimer les occupations problématiques du traitement de lignes de base

  Supprimer les fichiers de données de levé problématiques du traitement de lignes de base

Timeline maintient tous les fichiers avec des mesures GPS d'un seul récepteur dans un dossier de données. En outre, Timeline affiche les informations concernant chaque fichier de mesure GPS utilisant les éléments de levé. Chaque récepteur a son propre dossier de données séparé, et tous les éléments de levé affichés sur une seule ligne sont à partir du même récepteur.

Les éléments de levé sont affichés pour la période de temps pendant laquelle les données ont été enregistrées. Les dossiers de données pour chaque récepteur peuvent être ouverts pour fournir des informations supplémentaires, ainsi représentant toutes les données collectées au cours du levé.

Utilisez la souris pour naviguer à travers l'Afficheur de période de temps, puis sélectionnez des éléments afin d'afficher ou d'éditer leurs propriétés de données. Les informations de satellites et les affichages d'éphéméride Timeline peuvent être utilisés pour afficher ou éditer les données de façon plus détaillée.

Lors de l'utilisation de Timeline, vous pouvez toujours travailler dans la fenêtre graphique. Ces deux affichages sont liés ensemble—les sélections de données et les changements  qui se produisent dans une zone d'affichage sont sélectionnés dans l'autre. Pour vous informer de comment utiliser ces deux affichages ensemble, référez-vous à Sélection et édition des éléments Timeline.


     Sélection et édition des éléments Timeline

Plus amples informations

Comment ...	Dialogue	See also
Du fait que la fenêtre de graphiques et Timeline sont liées ensemble, vous pouvez effectuer les actions suivantes:

  Sélectionner les éléments d'occupation Timeline et voir le point sélectionné dans la fenêtre graphique.

  Sélectionner une ligne de base dans la fenêtre de graphiques et voir les Segments d'occupation composant la ligne de base soulignée dans Timeline.

  Sélectionner un point dans la fenêtre de graphiques et voir les segments associés soulignés dans Timeline.

NOTE: Si l'affichage de Ligne de base dépendante est activé, seules les observations affichées dans l'affichage de Timeline s'afficheront dans la fenêtre de graphiques. C'est un outil utile pour la sélection des lignes de base indépendantes. Pour activer l'affichage Ligne de base dépendante:

1.	Sélectionnez Affichage / Filtres. Le dialogue Filtres d'affichage s'affiche.

2.	Sélectionner Utiliser Timeline pour afficher l'option Lignes de base dépendantes GPS et cliquez sur OK.

Utilisez la barre d'outils Planification de report pour afficher ces reports et graphiques détaillés suivants:

  La DOP et le nombre de reports SV pour une occupation de station

  Les Plans du ciel des satellites pour une occupation de station

  Les reports de signal bruts de poursuite de satellites pour une session

Utilisez ces reports et graphiques pour:

  Changer la période de temps pour les données affichées

  Ouvrir plusieurs affichages au même temps afin d'afficher les informations en divers formats

  Redimensionner et réorganiser les fenêtres pour étudier les données

  Imprimer les reports et les graphiques

Les reports et les graphiques sont décrits dans les sections suivantes.

Sélection d'élément

Cinq actions sont associées à la sélection des éléments Timeline ou leurs données de projet correspondantes:

  Cliquez une fois sur un élément pour sélectionner les données associées à l'élément

  Double cliquez sur un élément pour afficher ses propriétés d'information

  Cliquez avec le bouton droit de la souris sur un élément pour afficher un menu de commandes pour travailler avec l'élément.

  Faites glisser déplacer un rectangle de sélection autour d'un ou plusieurs éléments avant d'afficher leurs propriétés ou de désactiver ou supprimer les données associées à l'élément

  Utilisez les actions de clic+maj ou clic+ctrl pour sélectionner des sélections aléatoires d'éléments

La sélection d'un élément est la même chose que la sélection des données de projet associées à l'élément.

Annuler les actions

La commande Annuler du logiciel Trimble Geomatics Office peut être utilisée pour annuler certaines actions de Timeline, telles que la suppression et la désactivation des éléments. Lorsqu'un élément Timeline est désactivé ou supprimé, son état original est mis dans le presse-papiers. La sélection de la commande Annuler renverse l'action de suppression ou désactivation.

NOTE: L'action de suppression ou désactivation ne peut pas être annuler lorsqu'une autre commande écrase les données dans le presse-papiers.

La commande Annuler est également disponible lors de l'édition des commandes des champs Heure de début et Heure de fin.  Vous pouvez couper ou copier de texte d'un champ et le coller dans l'autre.

Lecture des info-bulles d'élément

Ces Info-bulles s'affichent lorsque le pointeur de la souris est positionné sur un élément Timeline:

Lorsque le pointeur est positionné sur …	Un Info-bulle affiche …
un élément de levé	le nom du fichier de données associé à l'élément
un élément d'occupation ou de segment de données	le nom de la station associée à l'occupation
une observation GPS	le numéro de véhicule spatial associé aux informations de poursuite
une icône d'éphéméride	le numéro de véhicule spatial associé à une mise à jour d'éphéméride
une icône de Satellite ou un dossier de données	le modèle du récepteur et le numéro de série


     Edition des informations de poursuite de satellites

Plus amples informations

Comment ...	Dialog	Voir aussi

Utilisez le dialogue Propriétés d'observation GPS pour éditer une période de temps d'observations de satellite et appliquer ces éditions au traitement de lignes de base. Vous pouvez éditer les divers Types d'observation dans le signal de satellite d'un ou plusieurs satellites. Par exemple, vous pouvez désactiver l'observation encryptée L2 d'un ou plusieurs satellites.


     Commandes Timeline - Vue d'ensemble

Vue d'ensemble

Des diverses commandes Timeline sont exécutées en utilisant une ou plusieurs des quatre méthodes:

  Double cliquant sur les zones et les éléments Timeline

  Cliquant avec le bouton droit de la souris sur les zones et les éléments Timeline pour afficher un menu et sélectionnant l'une des options de commande

  Cliquant sur les boutons des barres d'outils

  Appuyant sur les séquences de touches

Il se peut que non toutes les commandes prennent en charges toutes quatre méthodes.

Les commandes suivantes sont disponibles:

  Continu

  Copier

  Couper

  Supprimer

  Report DOP

  Activer/Désactiver

  Ephéméride

  Info d'éphéméride

  Evénements

  Agrandir tout

  Coller

  Propriétés

  Satellites

  Sélectionner tout

  Réduire tout

  Plan du ciel

  Report SV

  Timeline

  Options d'heure

  Annuler

  Filtres d'affichage

  Zoom avant

  Zoom arrière

  Etendue de zoom

  Vue précédente

  Zoom à l'étendue

Des commandes supplémentaires sont disponibles dans Report SV.


    Dialogues de Propriétés Timeline - Vue d'ensemble

Plus amples informations

Comment ...	Dialogue	Voir aussi
Vue d'ensemble

La plupart de l'édition de données de levé dans Timeline est effectuée à l'aide du dialogue de propriétés. Certains des champs Timeline, cependant, tels que les champs Heure de début et Heure de fin pour les Occupations et les Segments, peuvent être édités en utilisant la Règle de temps ainsi qu'à partir du dialogue de propriétés. Les commandes Timeline pour la désactivation et la suppression de données à l'aide de la souris également fournissent des moyens alternatifs pour l'édition des données.

Les dialogues de propriétés peuvent être accédés de deux façons:

  Double cliquez sur l'élément.

  Cliquez avec le bouton droit de la souris et sélectionnez Propriétés.

Les dialogues de propriétés Timeline restent ouverts jusqu'à ce que vous cliquez sur OK ou Annuler. Aucun changement aux données n'est enregistré jusqu'à ce que vous cliquez sur OK. Il est possible d'ouvrir plus d'un dialogue de propriétés à la fois, vous permettant ainsi de comparer les divers propriétés des éléments. Par exemple, vous pouvez afficher les dialogues de propriétés pour deux ou plusieurs occupations au même temps.

Les dialogues de propriétés suivantes sont disponibles:

  Propriétés de récepteur

  Propriétés de levé

  Propriétés d'Occupation/Segment de données

  Propriétés GPS

  Propriétés d'éphéméride

NOTE: Les Icônes de satellite n'ont pas un dialogue de propriétés, mais vous pouvez afficher Report SV pour tracer, imprimer et exporter les informations brutes de poursuite collectées pour chaque satellite contribuant des données au levé.  Ces reports servent à l'étude des informations brutes de poursuite de satellites lorsque des écarts dans l'activité d'émission sont trouvés dans Observations GPS.


     Affichage Timeline - Vue d'ensemble

Plus amples informations

Comment ...	Voir aussi
Vue d'ensemble

Timeline comprend des affichages supplémentaires pour afficher des informations plus détaillées concernant les informations d'éphéméride et de poursuite de satellites collectées pendant un levé. Ces affichages peuvent être utilisés comme outils pour l'étude plus profonde des données collectées pour les occupations et les observations GPS collectées pour les satellites individuels.

Les affichages supplémentaires suivants sont disponibles:

  Affichage d'Observation de satellite

  Affichages d'Informations d'éphéméride

Les lignes directrices pour l'analyse des informations tracées dans chacun des affichages sont comprises dans les rubriques ci-dessus mentionnées. Utilisez ces lignes directrices pour effectuer un analyse plus profond de vos données.


     Solutions de lignes de base

Plus amples informations

 Voir aussi

Il y a cinq solutions de lignes de base possibles décrites ci-dessous:

  Solution flottante

  Solution fixe

  Solution fixe à voie large

  Solution fixe à voie étroite

  Solution ionosphérique libre


     Solution flottante

Plus amples informations

 Voir aussi

Une solution flottante est obtenue lorsque le processeur de lignes de base ne peut pas calculer une valeur de nombre entier définitive pour les termes d'ambiguïté. Souvent, pendant le traitement de lignes de base, l'ambiguïté se calcule à une valeur telle que 1000,60. Cette valeur n'est pas près d'une valeur de nombre entier, et il est difficile de déterminer si la valeur devrait être réglée à 1000 ou 1001. Donc, le processeur ne peut pas régler la valeur sur la valeur de nombre entier le plus près. Les composants de lignes de base sont calculés en utilisant les ambiguïtés comme les valeurs réelles. Cette solutions de base n'est pas aussi précise qu'une solution fixe.

Les solutions flottantes sont produites à partir des erreurs orbitales, atmosphériques non modelées et d'autres erreurs.


     Solution fixe

Plus amples informations

 Voir aussi

Une solution fixe est obtenue lorsque le processeur peut trouver un groupe de valeurs de nombre entier qui est d'une façon significative meilleur que toutes les autres possibilités. Le processeur de lignes de base règle la valeur d'ambiguïté sur un nombre entier afin de calculer les composants de ligne de base définitifs. Dans les levés en temps réel, il y a un mode d'opération connu comme Précis, lequel indique une solution de nombre entier fixe.

Pour les récepteurs à monofréquence, la solution optimale est en général une solution de nombre entier fixe de double différence. Avec les récepteurs à bi-fréquence, il est possible de combiner les observables de la phase porteuse de plusieurs façons, créant ainsi plusieurs solutions fixes différentes.


     Solution fixe à voie large

Plus amples informations

 Voir aussi

Le terme Voie large fait référence au procédé d'utiliser une combinaison d'observables de phase porteuse L2 et L1 dans les équations de différence. En différentiant les observables de phase porteuse (L1–L2) la phase porteuse à voie large est créée. La longueur d'onde effective de la phase porteuse est de 86,2 centimètres.

Il est plus facile de trouver les ambiguïtés de nombre entier en utilisant cette combinaison de mesure. Donc, en beaucoup des cas, la voie large est utilisée lors de la résolution des lignes de base longues.


     Solution fixe à voie étroite

Plus amples informations

 Voir aussi

Le terme Voie étroite fait référence au procédé d'utiliser une combinaison d'observables de phase porteuse L2 et L1 dans les équations de différence. L'addition des observables de phase porteuse (L1+L2) crée la phase porteuse à voie étroite. La longueur d'onde effective de la voie étroite est de 10,7 centimètres. La voie étroite est très efficace pour l'annulation des effets ionosphériques sur les observations de levé GPS.


     Solution ionosphérique libre

Plus amples informations

 Voir aussi

La solution ionosphérique libre utilise une combinaison de phase porteuse L1 et L2 pour modeler et supprimer les effets de l'ionosphère sur les signaux GPS. Ce type de solution est souvent utilisé pendant les levés hautement contrôlés, surtout lors de l'observation des lignes de base longues.


     Intensité de signal

L'intensité du signal d'un satellite, également connue comme le rapport signal/bruit (SNR), est une mesure du contenu des informations d'un signal par rapport au bruit du signal. Etant donné que cette proportion se diminue, les informations se perdent dans le bruit. La qualité du signal s'améliore lorsque le niveau du signal s'augmente (un niveau de signal de 14 est meilleur qu'un niveau de signal de 8). Le niveau du signal L1 d'un satellite à 30° est de 12 à 20. Une valeur L1 au-dessus de 20 est très bonne. La qualité des données est mauvaise lorsque le niveau de signal L1 d'un satellite dans la constellation est inférieur à 6.  Les niveaux de signal bas fournissent des positions qui sont suffisantes pour la navigation mais ne le sont pas pour des levés. Faites attention que le SNR du L2 très souvent est plus bas que le SNR du L1. Vous pouvez concentrer sur l'intensité de signal L1 pour estimer le bruit des données.

Les signaux de satellites GPS sont relativement faibles. En fait, en beaucoup des cas, le bruit de fond toujours présent est plus fort que le signal GPS. Lorsque l'intensité de signal d'un satellite est vraiment faible, les positions calculées à partir de ces mesures ont la tendance d'être incorrectes.

Il y a deux causes générales des signaux faibles. En premier, si le signal arrive à l'antenne après avoir pénétré un obstacle tel que des arbres, en général, il est affaibli, Les effets d'affaiblissement des arbres peuvent être minimisés par l'installation du récepteur afin qu'il a une vue claire du ciel. Deuxièmement, les satellites qui sont bas sur l'horizon en général ont un signal plus faible que les satellites plus directement au-dessus.

L'utilisation des satellites d'élévation basse peut également produire des erreurs de multi-trajet (une erreur qui se produit d'un signal GPS renvoyé). Pour éviter les mauvais effets des satellites d'élévation basse, il faut observer les masques d'élévation recommandés pour les levés. La plupart des levés post traités et les levés en temps réel sont réalisés avec un masque de 13°. Les données de satellites ne sont guère enregistrées lorsque les satellites sont au-dessous de 10°.


     Dilution de précision (DOP)

La dilution de précision (DOP) est une indication de la qualité d'une position. Elle est le résultat d'un calcul que prend en compte l'emplacement de chaque satellite par rapport aux autres satellites dans la constellation (la géométrie) pour prévoir la précision des positions obtenues avec cette constellation. Une DOP basse indique une géométrie de satellite forte et une plus haute probabilité de précision. Une DOP haute indique une géométrie de satellite faible et une probabilité plus basse de précision.

Les types de DOP calculés communément sont détaillés ci-dessous:

  Relative (RDOP) – erreur de position relative

  Position (PDOP) – mesures horizontales et verticales (lat, lon, ht)

  Horizontale (HDOP) – mesures horizontales (lat, lon)

  Verticale (VDOP) – mesures verticales (ht)

  Temps (TDOP) – décalage d'horloge

La PDOP est le meilleur indicateur global de la précision de la constellation, bien que la PDOP seule ne garantit pas une bonne détermination des lignes de base . Une PDOP de 4 ou moins fournit des positions excellentes. Une PDOP entre 5 et 7 est acceptable; une PDOP de 7 ou plus est insuffisante. Vous pouvez également régler le masque PDOP sur votre récepteur pour ignorer les constellations qui ont une PDOP plus haute que la limite que vous avez spécifié. Le masque PDOP par défaut dans les récepteurs de levé de Trimble est de 7. Il faut constater que ce masque n'a un effet que sur la détermination de position et n'a pas un effet aussi important sur le traitement de lignes de base subséquent.

Le programme QuickPlan vous permet de calculer la PDOP pendant vos observations sur le terrain. En saisissant l'emplacement et la date d'intérêt, la géométrie et la visibilité des satellites peuvent être prévues.


     Journal de traitement de lignes de base - Vue d'ensemble

Vue d'ensemble

Le processeur de lignes de base crée un fichier journal contenant des informations pouvant être utiles lors de l'analyse des solutions de lignes de base.

Le fichier s'appelle ProcessingLog.html et se trouve dans les dossier Rapports\Ligne de base existant dans chaque projet. Le fichier ProcessingLog.html peut être affiché à l'aide d'un afficheur HTML ou un explorateur de web.

Ce fichier est créé pour chaque session de traitement GPS. Si le fichier précédent n'est pas renommé, il sera écrasé chaque fois qu'une nouvelle session de traitement commence. Le processeur de lignes de base utilise ce fichier pour enregistrer des avertissements et des erreurs ayant un effet sur les résultats du traitement.

Lorsque tout avertissement ou erreur est enregistré dans ce fichier pendant le traitement, un dialogue s'affiche à la fin du traitement pour permettre d'accès au contenu de ce fichier,  basé sur la configuration dans le tabulation Propriétés du projet / Général pour le signalement des erreurs. Un ou plusieurs des avertissements ou erreurs peuvent être présents dans ce fichier:

Erreurs

  Ligne de base n'est pas résolue

Ligne de base <de Nom du point> -> <Vers Nom du point> n'est pas résolue

  Traitement du segment a des données insuffisantes pour le procédé OTF

Traitement du segment (<SemaineGPS> <SecondesSemaineGPS>) a des données insuffisantes pour le procédé OTF.  Longueur du segment = <Durée de temps>

  Echec d'initialisation du segment cinématique

Echec d'initialisation du segment cinématique.  Segment: <SemaineGPS> <SecondesSemaineGPS> -> <SemaineGPS> <SecondesSemaineGPS>

  Echec d'initialisation de ligne de base fixe

Echec d'initialisation de ligne de base fixe

  Echec d'initialisation de ligne de base statique

Echec d'initialisation de ligne de base statique

  Echec de solution cinématique

<Nomdufichier> échec de solution cinématique. Début: <SemaineGPS> <SecondesSemaineGPS>    Fin: <SemaineGPS> <SecondesSemaineGPS>

  Echec de solution Arrêt&Début

<Nom du point> Echec de solution Arrêt&Début.

Avertissements

Il se peut que les avertissements suivants sont rencontrés:

  Ligne de base a des solutions en double

<Idlignede base> Ligne de base a des solutions en double dans cette session. Une seule sera enregistrée.

  Ephéméride précise non disponible

Ephéméride précise non disponible pour <De Nom du point> -> <A Nom du point> <SemaineGPS> <SecondesSemaineGPS>, utilisant diffusée


     Ligne de base n'est pas résolue

Cette ERREUR a le format suivant:

Ligne de base <De Nom du point> -> <A Nom du point> n'est pas résolue

<De point> et <A point> sont les noms de point du projet and peuvent être utilisés pour identifier la ligne de base.

Lorsque cette erreur se produit une solution attendue pour cette ligne de base manquera de la liste de Traitement GPS.


     Traitement du segment a des données insuffisantes pour le procédé OTF

Cette ERREUR a le format suivant:

Traitement du segment (<SemaineGPS> <SecondesSemaineGPS>) a des données insuffisantes pour le procédé OTF. Longueur du segment = <Durée de temps>

<SemaineGPS> et <SecondesSemaineGPS> sont l'heure du début du segment pour lequel il y a un échec du procédé OTF. Ce temps peut être utilisé pour afficher les mesures GPS dont il s'agit en utilisant Timeline.

<Durée du temps> est la période de temps couverte par les mesures GPS pour lesquels il y a un échec du procédé OTF.

Lorsque cette erreur se produit le processeur de lignes de base n'a pas pu effectué une initialisation OTF et il se peut qu'il y aura un échec d'une ou plusieurs solutions de ligne de base cinématique. Il se peut qu'une ou plusieurs des solutions de ligne de base attendues manqueront de la liste de Traitement GPS.


     Echec d'initialisation du segment cinématique

Cette ERREUR a le format suivant:

Echec d'initialisation du segment cinématique.  Segment: <SemaineGPS> <SecondesSemaineGPS> -> <SemaineGPS> <SecondesSemaineGPS>

<SemaineGPS> et <SecondesSemaineGPS> sont l'heure de début et de fin du segment pour lequel il y a un échec d'initialisation cinématique. Ces temps peuvent être utilisés pour afficher les mesures GPS dont s'il s'agit en utilisant Timeline.

Lorsque cette erreur se produit le processeur de lignes de base n'a pas pu effectué une initialisation cinématique et il se peut qu'il y aura un échec d'une ou plusieurs solutions de ligne de base cinématique. Il se peut qu'une ou plusieurs des solutions de ligne de base attendues manqueront de la liste de Traitement GPS.


     Echec d'initialisation de ligne de base fixe

Cette ERREUR a le format suivant:

Echec d'initialisation de point connu

Lorsque cette erreur se produit le processeur de lignes de base n'a pas pu effectué une initialisation à partir d'un point connu il se peut qu'il y aura un échec d'une ou plusieurs solutions de ligne de base cinématique. Il se peut qu'une ou plusieurs des solutions de ligne de base attendues manqueront de la liste de Traitement GPS.


     Echec d'initialisation de ligne de base statique

Cette ERREUR a le format suivant:

Echec d'initialisation de ligne de base statique

Lorsque cette erreur se produit le processeur de lignes de base n'a pas pu effectué une initialisation à partir d'une occupation statique et il se peut qu'il y aura un échec d'une ou plusieurs solutions de ligne de base cinématique. Il se peut qu'une ou plusieurs des solutions de ligne de base attendues manqueront de la liste de Traitement GPS.


     Echec de solution cinématique

Cette ERREUR a le format suivant:

<Nomdufichier> échec de solution cinématique. Début: <SemaineGPS> <SecondesSemaineGPS>    Fin: <SemaineGPS> <SecondesSemaineGPS>

<Nomdufichier> est le nom du fichier avec les mesures GPS utilisées dans la solution cinématique.

<SemaineGPS> et <SecondesSemaineGPS> sont l'heure de début et de fin du segment pour lequel il y a un échec de solution cinématique. Ces temps peuvent être utilisés pour afficher les mesures GPS dont s'il s'agit en utilisant Timeline.

Lorsque cette erreur se produit une solution attendue pour cette ligne de base manquera de la liste de Traitement GPS.


     Echec de solution Arrêt&Début

Cette ERREUR a le format suivant:

<Nom du point> Echec de solution Arrêt&Début.

<Nom du point> est le nom du point pour lequel il y a un échec de solution cinématique Arrêt&Début.

Lorsque cette erreur se produit une solution attendue pour cette ligne de base manquera de la liste de Traitement GPS.


     Ligne de base a des solutions en double

Cet AVERTISSEMENT a le format suivant:

<Idlignede base> Ligne de base a des solutions en double dans cette session. Une seule sera enregistrée.

<Idlignede base> est un identificateur d'observation utilisé pour cette ligne de base dans le projet.

Cet avertissement se produit lorsqu'une occupation cinématique d'arrêt et début est divisée par dérapages de cycle. Si chaque partie consiste en deux ou plus époques, le processeur de lignes de base générera des solutions à chaque côté du dérapage comme s'il y avait deux occupations de ce point.

Si la case à cocher Ecraser solutions de lignes de base en double est sélectionnée une seule des solutions sera enregistrée. Cependant, ce peut être modifié en sélectionnant la case à cocher de la solution de ligne de base que vous voulez conserver, et par l'effacement de la case à cocher que vous ne voulez pas enregistrer.

Les solutions de lignes de base en double peuvent être identifiées par l'ID de ligne de base, qui sera la même pour les deux solutions.


     Ephéméride précise non disponible

Cet AVERTISSEMENT a le format suivant:

Ephéméride précise non disponible pour <De Nom du point> -> <A Nom du point> <SemaineGPS> <SecondesSemaineGPS>, utilisant diffusée

<De point> et <A point> seront remplacés avec des noms de point actuels du projet et peuvent être utilisés pour identifier la ligne de base.

<SemaineGPS> et <SecondesSemaineGPS> sont remplacées par l'heure de début de la ligne de base pour laquelle l'éphéméride précise n'est pas disponible. Vérifier le dossier du projet contenant les fichiers d'éphéméride précise pour assurer une couverture suffisante.

Cet avertissement indique que le traitement à éphéméride précise a été demandé, mais il y avait une insuffisance de données d'éphéméride précise. Lorsque cette situation se produit l'éphéméride diffusée est utilisée à sa place.