Copyright: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.
Citation: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.


Bienvenue
Le logiciel Trimble DTMLink™ du logiciel Trimble Geomatics Office™ est un système puissant pour la génération d’un modèle de surface de courbes de niveau. Avec ce logiciel vous pouvez créer des nouvelles surfaces de courbes de niveau et éditer vos surfaces de courbes de niveau créées précédemment. Vous pouvez également importer des surfaces de courbes de niveau générées d'autres logiciels de courbes de niveau.

Le logiciel a la capacité d’inclure les limites et les lignes de changement de pente dans le modèle de surface de courbes de niveau, et permet l’utilisation des caractéristiques d’édition de triangles avancés afin de fournir un plus grand contrôle de la formation du modèle.

Un Modèle Numérique de Terrain triangulé ou à grille est créé à partir du modèle de surface de courbes de niveau pour l’exportation vers un carnet de terrain ou un fichier de données.

Le modèle que vous créez peut être utilisé par le logiciel RoadLink™ pour les calculs de terrassements.

Le logiciel DTMLink vous permet de créer des rapports de volume.

Les applications typiques pour les calculs de volume sont:

  les calculs de réserve

  les volumes des couches de matériaux, telles que les couches de charbon

  les volumes des vides tels que les lacs derrières des barrages de retenue projetés

Le logiciel DTMLink utilise la méthode de calcul des volumes des prismes triangulaires individuels. Ils sont définis par les plans triangulaires qui forment le modèle de surface de courbes de niveau en utilisant les surfaces de base et les hauteurs moyennes des prismes.

Le logiciel DTMLink vous permet de créer des surfaces de comparaison. Une surface de comparaison est un modèle de surface de courbes de niveau de la différence entre les deux surfaces. Vous pouvez utiliser cette surface conjointement avec le type de calcul de volume 'Au-dessus d'une élévation' pour calculer les volumes en déblai et en remblai entre les deux surfaces.


Contenu

Les Rubriques d’aide suivantes sont disponibles:

1. Logiciel DTMLink de Trimble

2. Commandes du menu

3. Astuces

4. Messages d’erreur

5.  Toutes les rubriques

Nous supposons que vous connaissez les principes de base de l’utilisation de Microsoft Windows. Consultez votre documentation de Microsoft Windows si vous avez des doutes sur l’utilisation du logiciel Windows.


Toutes les rubriques

Dans la section Toutes les rubriques du Contenu, toutes les rubriques dans ce système d’Aide sont listées en ordre alphabétique.


Ouvrir surface
Fichier / Ouvrir surface

	Cliquez sur l’outil Ouvrir surface sur la barre d’outils standard

Utilisez cette commande pour ouvrir une surface.

Surfaces disponibles dans

Sélectionnez un nom de la liste de noms affichée dans la partie inférieure du dialogue Sélectionner surface et entrez ce nom dans le champ au-dessous du champ Surfaces disponibles dans.  Lorsque le nom n’est pas listé, cliquez sur Dossier.

NOTE: Le champ Surfaces disponibles dans est en lecture seule.

Dossier

Cliquez sur Dossier pour ouvrir le dialogue Rechercher un dossier. Le dialogue vous permet de sélectionner le dossier dans lequel les fichiers sont contenus.

Le dossier par défaut est C:\Trimble Geomatics Office\Projets\xx\RoadLink – DTMLink …, où xx est le Nom du projet.

ASTUCE: Lors de l’utilisation du dialogue Rechercher un dossier, toujours parcourez pour le fichier de surface au répertoire du niveau le plus bas.


Enregistrer surface
Fichier / Enregistrer surface

	Utilisez l’outil Enregistrer surface sur la barre d’outils standard

Utilisez cette commande pour enregistrer les changements effectués à la surface courante.


Fermer surface
Fichier / Fermer surface

Utilisez cette commande pour fermer un fichier dans le logiciel DTMLink™.


Importer
Fichier / Importer

	Utilisez l'outil Importer sur la barre d'outils standard.

Utilisez cette commande pour importer le type de fichier suivant dans le projet:

BULLET.BMP}  Fichier de modèle numérique de terrain TIN Trimble (*.ttm)

  Fichier de Modèle numérique de terrain à grille (*.dtx)

  Surface (TIN) d’un fichier de projet TerraModel (*.pro)

  Surface (TIN) d’un fichier AutoCAD DXF

  Surface de fichier LandXML (*.xml)

  Fichier de grille Paydirt/SiteWork (*.grd)

  Fichier Civilcad ASCII 5

  Fichier de surface 12D

  Fichier de surface InRoads

  Fichier MX GENIO TIN

  Fichier de surface REB

  GEOPAK Grid Spots


Fichier de Modèle numérique de Terrain TIN Trimble (*.ttm)

Utilisez cette commande pour importer un fichier de Modèle numérique de terrain TIN Trimble dans DTMLink:

1.	Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Fichier de Modèle numérique de terrain TIN Trimble (*.ttm) et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

Le champ Fichiers de type n’affiche que le type Modèle numérique de terrain Trimble (*ttm). Vous ne pouvez pas changer le type de fichier depuis ce champ.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis.

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Fichier de Modèle numérique de Terrain à grille Trimble (*.dtx)

Utilisez cette commande pour importer un fichier de Modèle numérique de terrain à grille Trimble dans DTMLink:

1.	Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Fichier de Modèle numérique de terrain à grille Trimble (*.dtx).

 	ASTUCE: Cliquez sur le bouton Configuration pour supprimer les points qui définissent la grille, et qui se trouvent dans une tolérance spécifiée.

3.	Cliquez sur OK.

Le dialogue Ouvrir s’affiche.

4.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

Le champ Fichiers de type n’affiche que le type Modèle numérique de terrain à grille Trimble (*dtx). Vous ne pouvez pas changer le type de fichier depuis ce champ.

5.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis

6.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Importer la configuration MNT à Grille

Utiliser cette option pour supprimer les points qui définissent la grille, et qui se trouvent dans une tolérance spécifiée. Sélectionnez Décimer la grille et, dans le champ Tolérance de décimation grille à TIN, spécifiez la valeur de tolérance.


Surface (TIN) d'un fichier de projet TerraModel (*.pro)

Utilisez cette commande pour importer une Surface (TIN) d’un fichier de projet TerraModel dans DTMLink.

NOTE: Afin de convertir à un fichier de Surface (TIN) avec succès, le fichier de projet TerraModel doit avoir un réseau de triangles dans une couche.

Pour importer le fichier:

1.   Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Surface (TIN) d'un fichier de projet TerraModel (*.pro) et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

Le champ Fichiers de type n’affiche que le type Modèle numérique de terrain Trimble (*ttm). Vous ne pouvez pas changer le type de fichier de ce champ.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis.

5.	Cliquez sur Ouvrir.

Si le fichier n’a qu’une surface, la surface sera importée. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.

Si le fichier de projet TerraModel a plus d’une couche, le dialogue Choisir la couche de surface s’affiche.

6.	Sélectionnez la couche ou les couches à importer. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Dialogue Choisir la couche de surface

Utilisez ce dialogue pour sélectionner la couche à convertir pour l’importation.

Dans la liste Couches, sélectionnez la couche à convertir à un fichier de surface. Vous pouvez sélectionner des couches multiples à importer mais seulement une surface à la fois peut être affichée.


Surface (TIN) d'un fichier AutoCAD DXF

Utilisez cette commande pour importer une Surface (TIN) d’un fichier AutoCAD DXF dans DTMLink.

NOTE: Afin de convertir un fichier de Surface (TIN), le fichier AutoCAD DXF doit consister en un réseau de triangles de faces 3D, ou de polylignes 3D.

Pour importer le fichier:

1.	Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	Si le fichier DXF a été généré à l’origine utilisant des unités autres que celles spécifiées dans le projet, cliquez sur Configuration pour configurer le fichier DXF.

Le dialogue Options de configuration d’importation DXF s’affiche. Utilisez ce dialogue pour assigner les unités au fichier DXF importé ou converti.  Vous devez spécifier les mêmes unités que celles lors de la création du fichier DXF original.

3.	Sélectionnez les unités appropriées pour le fichier DXF.

4.	Cliquez sur OK dans le dialogue Options de configuration d'importation DXF.

5.	Cliquez sur OK dans le dialogue Importer.

Le dialogue Ouvrir s’affiche.

6.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

Le champ Fichiers de type n’affiche que le type Fichier ASCII AutoCAD DXF file (*.dxf). Vous ne pouvez pas changer le type de fichier de ce champ.

7.	Effectuez l’une des choses suivantes :

  Entrez le nom du fichier.

  Cliquez sur le fichier requis.

8.	Cliquez sur Ouvrir.

Si le fichier n’a qu’une surface, la surface sera importée. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.

Si le fichier a plus d’une couche, le dialogue Choisir la couche de surface s’affiche.

9.	Sélectionnez la couche ou les couches à importer. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Dialogue Options de configuration d'importation DXF

Utilisez ce dialogue pour configurer les unité pour l’importation d’un fichier de Surface (TIN) d’un fichier AutoCAD DXF.

Unités de fichier DXF

Utilisez ce champ pour assigner des unités au fichier DXF que vous importez. Par exemple, si le projet DTMLink utilise les pieds internationaux comme ses coordonnées mais un fichier .dxf a été généré avec Mètres, alors il faut spécifier Mètres dans ce groupe lors de l’importation du fichier *.dxf.

Pour changer les unités, sélectionnez dans la liste déroulante:

  Mètres (m)

  Pieds internationaux (pd)

  Pieds américains (PD)

NOTE: Lors de l’importation d’une Surface (TIN) d’un fichier AutoCAD DXF, le champ Compresser les polylignes n’est pas disponible.


Surface de fichier LandXML (*.xml)

Utilisez cette commande pour importer une surface d’un fichier LandXML dans DTMLink:

1. Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Surface de fichier LandXML et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Fichier de grille Paydirt/SiteWork (*.grd)

Utilisez cette commande pour importer une surface d’un fichier de Grille Sitework dans DTMLink:

1. Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Fichier de grille Paydirt/SiteWork (*.grd).

ASTUCE: Cliquez sur le bouton Configuration pour supprimer les points définissant la grille, qui se trouvent dans la tolérance spécifiée.

3.	Dans le dialogue Importer, cliquez sur OK.

Le dialogue Importer un fichier de grille Sitework s’affiche.

3.	Cliquez sur Parcourir pour rechercher le dossier contenant le fichier à importer.

4.	Dans le champ Fichiers, naviguez au fichier de grille SiteWork requis.

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Importer un fichier de grille Sitework

Utilisez ce dialogue pour importer un fichier de grille SiteWork dans le logiciel DTMLink.

Position

Ce champ indique la position du fichier de grille SiteWork.

Parcourir

Cliquez sur ce bouton pour rechercher le dossier contenant le fichier de grille SiteWork.

Fichiers

Utilisez ce champ pour sélectionner le fichier de grille SiteWork.

OK

Cliquez sur ce bouton pour importer le fichier de grille SiteWork.

Annuler

Cliquez sur ce bouton pour annuler l’opération d’importation et retourner au dialogue Importer.


Fichier Civilcad ASCII 5

Utilisez cette commande pour importer un fichier Civilcad ASCII 5 dans DTMLink:

1. Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

3.	De la liste dans la tabulation Surface, sélectionnez Civilcad ASCII 5 (*.AS5)

ASTUCE: Cliquez sur le bouton Configuration pour supprimer les points définissant la grille, qui se trouvent dans la tolérance spécifiée.

3.	Cliquez sur OK.

Le  dialogue Ouvrir s’affiche.

4.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

5.	Cliquez sur Ouvrir.

Le dialogue Choisir la couche de surface s’affiche.

6.	Sélectionnez la couche contenant les informations de grille.

7.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Fichier de surface 12D

Utilisez cette commande pour importer un fichier de surface 12D dans DTMLink:

1. Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2   De la liste dans la tabulation Surface, sélectionnez Fichier de surface 12D et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Surface de fichier InRoads (*.tin)

Utilisez cette commande pour importer une surface d’un fichier InRoads dans DTMLink:

1. Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Fichier de surface InRoads et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Fichier MX GENIO TIN

Utilisez cette commande pour importer un fichier MX GENIO TIN (*.txt) dans DTMLink:

1. Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2   De la liste dans la tabulation Surface, sélectionnez Fichier MX GENIO TIN et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


GEOPAK Grid Spots

Utilisez cette commande pour importer un Modèle numérique de terrain  (*.dtx) d’un fichier GEOPAK dans DTMLink:

1.	Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez GEOPAK Grid Spots.

ASTUCE: Cliquez sur le bouton Configuration pour supprimer les points définissant la grille, qui se trouvent dans la tolérance spécifiée.

3.	Cliquez sur OK.

Le  dialogue Ouvrir s’affiche.

4.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez importé un fichier la dernière fois.

Le champ Fichiers de type n’affiche que le type Tous (*.*). Vous ne pouvez pas changer le type de fichier dans ce champ parce qu’un fichier GEOPAK peut avoir toute extension.

5.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis.

6.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée


Fichier de surface REB

Utilisez cette commande pour importer un fichier de surface REB (*.reb) dans DTMLink:

1.	Sélectionnez Fichier / Importer.

Le dialogue Importer s’affiche.

2.	De la liste dans la tabulation Surface, sélectionnez Fichier de surface REB et cliquez sur OK.

Le dialogue Ouvrir s’affiche.

3.	Dans le champ Rechercher dans, choisissez le dossier contenant le fichier à importer. DTMLink vous invite à utiliser le dossier duquel vous avez  importé un fichier la dernière fois.

4.	Effectuez l’une des choses suivantes:

  Entrez le nom du fichier.

  Cliquez sur le fichier requis

5.	Cliquez sur Ouvrir pour importer la surface. Si une surface du même nom existe déjà dans le projet, le dialogue Importer surface s’affiche. Vous devez renommer la surface importée.


Importer surface

Utilisez le dialogue Importer surface pour nommer la nouvelle surface. Ce dialogue ne s’affiche que si une surface du même nom existe déjà dans le projet.

Nouveau nom de surface

Le nom du fichier est le nom par défaut de la surface. Utilisez ce champ pour assigner un nom unique à la surface.


Exporter
Fichier / Exporter

	Utilisez l’outil Exporter sur la barre d’outils standard

Utilisez cette commande pour exporter (ou envoyer) un fichier vers un Survey Controller ou un Périphérique TDS ou pour créer un fichier.

NOTE: Les formats d’exportation réalisant la sortie des fichiers ASCII toujours réalisent la sortie des données numériques sous forme standardisée, c’est à dire, aucun séparateur de mille et un point pour la décimale.

Le dialogue Exporter dresse une liste des formats d’exportation disponibles. Les tabulations dans le dialogue affichent les types de formats d’exportation.

Tabulation Système

Utilisez cette tabulation pour sélectionner de la liste de formats disponibles.

Utilisez ce format d’exportation …	pour créer …
MNT TIN au Trimble Survey Controller	un fichier MNT triangulé compatible des points sélectionné pour l’exportation directement au Trimble Survey Controller.
MNT TIN au Trimble Survey Controller (*.ttm)	un fichier MNT triangulé des points sélectionnés.
MNT à grille au Trimble Survey Controller	un fichier MNT à grille compatible des points sélectionnés pour l’exportation directement vers le logiciel Trimble Survey Controller.
MNT à grille au fichier Trimble Survey Controller (*.dtx)	un fichier MNT à grille des points sélectionnés. Les valeurs de MNT à grille sorties à un fichier ASCII sont toujours dans le format de mètres.
MNT TIN au Trimble 5600 TDS	un fichier MNT triangulé compatible des points sélectionnés pour l’exportation directement dans un instrument Trimble 5600 TDS.
MNT TIN DTM au fichier Trimble 5600 TDS (*.dtm)	un fichier MNT triangulé compatible des points sélectionnés comme un fichier Trimble 5600 TDS (*.dtm) pouvant être lu par un instrument Trimble 5600 TDS exécutant TDS Survey Pro CE.
MNT TIN au TDS Survey Pro CE	un fichier MNT triangulé compatible des points sélectionnés pour l’exportation directement dans un contrôleur TDS Survey Pro CE.
MNT TIN au fichier TDS Survey Pro CE (*.dtm)	un fichier MNT triangulé compatible des points sélectionnés pouvant être lu par un contrôleur TDS Survey Pro CE.
Fichier AutoCAD DXF à faces 3D	un fichier ASCII DXF à faces 3D pouvant être transféré au logiciel tiers. Une entité à faces 3D est écrite pour chaque triangle dans le modèle de courbes de niveau.
Courbes de niveau au fichier AutoCAD DXF	un fichier ASCII DXF des courbes de niveau pouvant être transféré au logiciel tiers. Cliquez sur Configurer pour spécifier les options de sortie.
 Voir aussi


MNT à grille pour Trimble Survey Controller

Utilisez ces types pour créer un groupe régulier des données à grille avec les élévations des points interpolées à partir du modèle de courbes de niveau.

NOTE: Le Modèle Numérique de Terrain (MNT) à grille permet l’interpolation d’une grille régulière de points Nord-Sud/Est-Ouest du modèle de courbes de niveau courant.

Utilisez la commande Fichier / Exporter pour créer un MNT à grille pour exporter au logiciel Trimble Survey Controller™ version 6.5 ou ultérieure.

Sélectionnez les options d’exportation MNT à grille au Survey Controller ou MNT à grille au Trimble Survey Controller.

Cliquez sur OK, et une grille rectangulaire s’affiche dans la fenêtre de graphiques. Cette grille rectangulaire affiche le rectangle le plus petit qui entoure la surface complètement. Faisant glisser-déplacer les limites de la grille rectangulaire vous permet de définir la surface requise.

ASTUCE: Utilisez les champs Gauche, En haut, Droite, et En bas dans la boîte de groupe du dialogue Rectangle de grille pour mettre à point la taille du rectangle.

Les champs dans le dialogue Rectangle de grille sont:

Gauche

Utilisez remplir le champ ou entrez les valeurs pour l’est du côté gauche de la boîte mesurées en mètres, pieds internationaux ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord gauche du rectangle dans la fenêtre de graphiques.

En haut

Utilisez remplir le champ ou entrez les valeurs pour le nord du côte en haut de la boîte mesurées en mètres, pieds internationaux, ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord en haut du rectangle dans la fenêtre de graphiques.

Droite

Utilisez remplir le champ ou entrez les valeurs pour l’est du côte droit de la boîte mesurées en mètres, pieds internationaux, ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord droit du rectangle dans la fenêtre de graphiques.

En bas

Utilisez remplir le champ ou entrez les valeurs pour le nord du côte en bas de la boîte mesurées en mètres, pieds internationaux, ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord en bas du rectangle dans la fenêtre de graphiques.

Taille de grille

Utilisez les champs de la tabulation Taille de grille pour spécifier le nombre de colonnes et de lignes formant la grille.

Colonnes	Entrez le nombre de colonnes pour le Rectangle de grille.
Lignes	Entrez le nombre de lignes pour le Rectangle de grille.
Ces deux champs passent par défaut à dix (10). Ce signifie qu’il est possible d’avoir la grille formée sur une base rectangulaire.

NOTE: Lorsque vous changez le nombre de Colonnes, Lignes, ou toutes les deux sur la tabulation Tailles de grille, les champs Hauteur et Largeur sur la tabulation Tailles de pas sont recalculés automatiquement par le logiciel DTMLink™. Les champs mis à jour affichent la nouvelle hauteur et la nouvelle largeur pour chaque Taille de pas.

Taille de pas

Utilisez les champs sur la tabulation Taille de pas pour spécifier la largeur et la hauteur  de chaque colonne et ligne composant la grille.

Largeur	Entrez la valeur pour la largeur d’une colonne.
Hauteur	Entrez la valeur pour la hauteur d’une ligne.
NOTE: Tout changement aux valeurs de Hauteur, Largeur ou toutes les deux sur la tabulation Taille de pas se termine par un recalcul des champs de Taille de grille.

OK

Cliquez sur OK pour exporter le MNT à grille. Le fichier fournit une liste des coordonnées et des élévations interpolées à chaque point de grille. Si vous avez sélectionné l’option d’exportation MNT à grille au Survey Controller, vous pouvez sélectionner le périphérique auquel il faut enregistrer le fichier.

NOTE: Les Points de grille dans le rectangle des limites mais au dehors de la surface de courbes de niveau n’ont pas une élévation interpolée et sont rapportés comme une ligne vide dans le fichier.


MNT triangulé pour Trimble Survey Controller

Utilisez ce type pour créer des données triangulées basées sur les points définissant les triangles du modèle de courbes de niveau.

Pour créer un MNT triangulé pour l'exportation au logiciel Trimble Survey Controller™ version 7.5 ou ultérieure :

1.	Sélectionner Fichier / Exporter.

2.	Dans le dialogue Exporter, sélectionnez l’une des options suivantes:

  MNT TIN au Trimble Survey Controller

  MNT TIN au fichier Trimble Survey Controller

3.	Cliquez sur OK.

Dans la fenêtre graphique une grille affiche le rectangle le plus petit qui entoure la surface complètement. Faites glisser-déplacer les limites de la grille rectangulaire afin de définir la superficie requise.

ASTUCE: Utilisez les champs Gauche, En haut, Droite, et En bas dans la boîte de groupe du dialogue Etendue TIN pour mettre à point la taille du rectangle.

Gauche

Utilisez remplir le champ ou entrez les valeurs pour le côté gauche (ouest) de la boîte mesurées en mètres, pieds internationaux ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord gauche du rectangle dans la fenêtre de graphiques.

En haut

Utilisez remplir le champ ou entrez les valeurs le côte en haut (nord) de la boîte mesurées en mètres, pieds internationaux, ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord en haut du rectangle dans la fenêtre de graphiques.

Droite

Utilisez remplir le champ ou entrez les valeurs du côte droit (est) de la boîte mesurées en mètres, pieds internationaux, ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord droit du rectangle dans la fenêtre de graphiques.

En bas

Utilisez remplir le champ ou entrez les valeurs pour le  côte en bas (sud) de la boîte mesurées en mètres, pieds internationaux, ou pieds américains. Ce champ affiche l’étendue du déplacement sur le bord en bas du rectangle dans la fenêtre de graphiques.

OK

Cliquez sur OK pour exporter le MNT triangulé. Le fichier fournit une liste des coordonnées et des élévations pour chaque triangle. Si vous sélectionnez l'option d'exportation MNT TIN au Trimble Survey Controller, Vous pouvez sélectionner le périphérique auquel il faut enregistrer le fichier.


MNT triangulé pour Trimble 5600 TDS

Utilisez ce type pour créer des données triangulées basées sur les points définissant les triangles d’un modèle de courbes de niveau.

Pour créer un MNT triangulé pour l’exportation à un Trimble 5600 TDS:

1.	Sélectionnez Fichier / Exporter.

2.	Dans le dialogue exporte, sélectionnez l’une des options suivantes:

  MNT TIN au Trimble 5600 TDS

  MNT TIN au fichier Trimble 5600 TDS

3.	Cliquez sur le bouton Configurer pour spécifier les unités du fichier exporté. Utilisez cette option pour exporter le MNT TIN dans des unités autre que celle du projet DTMLink.

4.	Cliquez sur  OK pour exporter le MNT triangulé.


MNT triangulé pour TDS Survey Pro CE

Utilisez ce type pour créer des données triangulées basées sur les points définissant les triangles d’un modèle de courbes de niveau.

Pour créer un MNT triangulé pour l’exportation au TDS Survey Pro CE:

1.	Sélectionnez Fichier / Exporter.

2.	Dans le dialogue exporte, sélectionnez l’une des options suivantes:

  MNT TIN au TDS Survey Pro CE

  MNT TIN au fichier TDS Survey Pro CE

3.	Cliquez sur le bouton Configurer pour spécifier les unités du fichier exporté. Utilisez cette option pour exporter le MNT TIN dans des unités autre que celle du projet DTMLink.

4.	Cliquez sur  OK pour exporter le MNT triangulé.


Options d'exportation MNT TIN TDS

Utilisez cette option pour exporter le MNT TIN dans des unités autre que celle du projet DTMLink. Sélectionnez l’unité appropriée dans la liste Unités de fichier.


Renommer surface
Fichier / Renommer surface

Utilisez cette commande pour renommer le fichier de surface courant.

Le dialogue Renommer surface s’affiche. Entrez le nouveau nom pour la surface courante dans le champ.

Cliquez sur OK pour renommer la surface courante.


Copier surface
Fichier / Copier surface

Utilisez cette commande pour copier le fichier de surface courant.

Le dialogue Copier surface s'affiche.

Entrez un nom unique pour la nouvelle surface.

OK

Cliquez sur OK pour copier la surface.


Supprimer surface
Fichier / Supprimer surface

Utilisez cette commande pour supprimer une surface.

Dossier

Cliquez sur Dossier pour ouvrir le dialogue Rechercher un dossier. Le dialogue vous permet de naviguer au fichier de surface à ouvrir.

Les surfaces sont stockées dans C:\Trimble Geomatics Office\Projets\xx\RoadLink - DTMLink …, où xx est le nom du projet.

ASTUCE: Utilisez le Bac de recyclage de Microsoft Windows pour récupérer les fichiers.


Quitter
Fichier / Quitter

Utilisez cette commande pour fermer la surface courante et quitter le logiciel DTMLink™.


Menu Fichier

Utilisez le menu Fichier pour gérer les surfaces. Il a les commandes suivantes:

Ouvrir surface

Enregistrer surface

Fermer surface

Importer

Exporter

Renommer surface

Copier surface

Supprimer surface

Quitter


Fichier AutoCad DXF à faces 3D

DTMLink crée un fichier ASCII DXF à faces 3D. Les coordonnées et l'élévation à chaque sommet de triangle sont écrites au fichier dans le format DXF.

Pour exporter un fichier DXF à faces 3D:

1.	Utilisez la commande Fichier / Exporter.

2.	 Sélectionner l’option d’exportation AutoCAD DXF à faces 3D.

3.	Cliquez sur OK.

Le dialogue Exporter faces 3D au fichier DXF s'affiche.

4. 	Entrez un nom du fichier dans le champ Nom du fichier.

5.	Cliquez sur Enregistrer.

Le fichier est stocké par défaut dans C:\Trimble Geomatics Office\Projets\xx\RoadLink – DTMLink …, où xx est le Nom du projet.


Courbes de niveau au fichier AutoCAD DXF

Utilisez cette option pour créer une fichier DXF ASCII des courbes de niveau.

Pour exporter un fichier de courbes de niveau DXF:

1.	Sélectionnez Fichier / Exporter.

Le dialogue Exporter s'affiche.

2.	Sélectionnez ce format d'exportation pour créer un fichier DXF ASCII des courbes de niveau. Il est possible de lite et d'afficher les courbes de niveau dans le logiciel Trimble Geomatics Office™ et tout logiciel tiers applicable.

3.	Cliquez sur Configurer pour spécifier les options de sortie.

Le dialogue Options de c. de niveau DXF s'affiche.

4.	Sélectionnez l'une des options suivantes:

  L'option Lignes droites pour exporter les courbes de niveau sous forme des lignes droites

  L'option Segments de ligne pour exporter les courbes de niveau sous forme des segments de ligne se rapprochant aux courbes

5.	Spécifiez la longueur maximum de segments de ligne.

5.	Cliquez sur OK pour confirmer l'option de sortie.

Le dialogue Exporter s'affiche.

7.	Cliquez sur OK.

Le dialogue Exporter c. de niveau au fichier DXF s'affiche.

8.	Entrez un nom du fichier.

9.	Cliquez sur Enregistrer pour exporter le fichier.

Le fichier est stocké par défaut dans C:\Trimble Geomatics Office\Projets\xx\RoadLink – DTMLink …, où xx est le Nom du projet.


Options de c. de niveau DXF

Utilisez ce dialogue pour spécifier les options de sortie des courbes de niveau DXF.

Vous pouvez sélectionner d'exporter les lignes de courbes de niveau sous forme de lignes droites ou de segments de ligne pour se rapprocher aux courbes.

Lorsque vous sélectionnez des segments de ligne se rapprochant aux courbes, vous pouvez spécifier la longueur du segment de ligne. La plus courte la ligne, la meilleure sera l'approximation de la courbe mais le fichier DXF consistera en plus de points.


Dialogue Ouvrir

C’est le dialogue Ouvrir standard:

1.	Recherchez le dossier requis.

2.	Sélectionnez le type de fichier.

3.	Sélectionnez le fichier.


Annuler
Edition / Annuler

	Cliquez sur l’outil Annuler sur la barre d’outils standard

Utilisez cette commande ou cet outil pour annuler la dernière modification faite à la surface. Le texte de la commande du menu indique quelle modification elle est.


Menu Edition

Utilisez le menu Edition pour annuler la dernière modification faite à la surface.

Il a la commande suivante:

Annuler


Rubriques d'aide
Aide / Rubriques d’aide

Dans le logiciel Trimble DTMLink™ les commandes sont groupées sous menus.

Les commandes des menus sont:

Fichier

Editer

Affichage

Projet

Outils

Fenêtre

Aide


A propos
Aide / A propos

La commande A propos du menu Aide affiche les informations du programme et copyright du logiciel Trimble DTMLink™.

NOTE: Il n’est pas permis de copier ce programme sauf aux fins de sauvegarde et d’archivé.

Vous aurez besoin de ces informations si vous avez des problèmes nécessitant du support technique.


Astuce du jour
Aide / Astuce du jour

Le système Astuce du jour fournit des petites astuces pour vous aider dans l’opération de votre système. La sélection de cette option affichera la prochaine astuce du jour. Une case à cocher sur le dialogue Astuce du jour, vous permet de choisir si une astuce s’affiche à chaque fois que vous démarrez le système.


Menu Aide

Le menu Aide fournit des informations concernant le logiciel DTMLink™. Il a les commandes suivantes:

Rubriques d’aide

Astuce du jour

A propos


Utilisation des barres d'outils

Les barres d’outils fournissent un accès rapide aux commandes du menu fréquemment utilisées. Une brève description de chaque bouton de la barre d’outils apparaît sur la barre d’état lorsque vous maintenez la souris sur le bouton.

Par exemple, “Inclut un point dans le modèle de surface” affiche sur le panneau de messages de la barre d’état lorsque vous vous déplacez au-dessus du bouton Inclure point sur la barre d’outils Surface.

Vous pouvez masquer, déplacer ou modifier la taille de toute barre d’outils et l’organiser selon vos préférences de travail.

Les barres d’outils peuvent être déplacées de n’importe quel côté de la fenêtre, en haut de l’espace de travail sous les menus, ou en bas de l’espace de travail sous la barre d’état . D’autre part, vous pouvez déplacer toute barre d’outils n’importe où sur l’écran et l’orienter verticalement ou horizontalement.

Pour restaurer les paramètres par défaut, cliquez sur Remettre dans Affichage / Barre d’outils. (chaque barre d’outils retourne dans la zone définie par les paramètres par défaut si vous cliquez deux fois sur la barre des titres de la barre d’outils.)

Infobulles

Lorsque vous placez le curseur sur un bouton d’outil, une petite fenêtre appelée un Infobulle s’affiche pour vous indiquer qu’est-ce qu’il fait. La description brève s’affiche près du curseur et au-dessous de l’outil.

NOTE: Coupant les barres d’outils masque la barre de titre.

Les trois barres d’outils sont:

Barre d’outils standard

Barre d’outils Affichage

Barre d’outils Surface


Barre d'outils standard

La barre d’outils standard fournit un accès rapide à certains éléments du menu principal.

Les options suivantes sont disponibles à partir de la Barre d’outils:

Bouton	Commande de menu	Description
	Fichier / Ouvrir surface	Ouvre une surface existante
	Fichier / Enregistrer surface	Enregistre les changements à la surface courante
	Fichier / Importer	Vous permet d'importer une surface d’un logiciel tiers
	Fichier / Exporter	Vous permet d’exporter les données vers un Survey Controller, un périphérique TDS ou un fichier
	Edition / Annuler	Annule la dernière action. L’élément du menu indique l’opération pouvant être annulée.
	Affichage / Propriétés	Affiche la fenêtre Propriétés. Cette fenêtre affiche des informations concernant les points de surface, les lignes de c/p et les limites.


Barre d'outils Affichage

La barre d’outils Affichage fournit des outils de navigation pour aider l’affichage dans la fenêtre de graphiques principale.

Les options suivantes sont disponibles à partir de la barre d’outils Affichage:

Bouton	Commande de menu	Description
	Menu de raccourcis	L’outil Sélectionner vous permet de sélectionner un point de surface, une ligne de c/p, ou une ligne de limites ainsi que d’afficher l’entité sélectionnée dans la fenêtre Propriétés.
	Affichage | Déplacer	Déplace le centre de la surface de zoom
	Affichage | Zoom avant	Grossit l’affichage en augmentant l’échelle.
	Affichage | Zoom arrière	Réduit l’affichage en diminuant l’échelle.
	Affichage | Etendue de zoom	Change l’échelle afin que la fenêtre affiche toutes les entités dans le projet courant.
	Affichage | Vue précédente	Affiche une vue précédente de l’écran.
	Affichage | Couches	Affiche ou masque les couches différentes.
	Affichage | Fenêtre flottante	Ouvre la fenêtre flottante affichant une vue à petite échelle des entités dans l’affichage actuellement sélectionné. Vous pouvez redimensionner et déplacer cette fenêtre.


Barre d'outils Surface

La barre d’outils Surface fournit des outils pour vous aider à utiliser le logiciel DTMLink™ de façon plus efficace.

Les options suivantes sont disponibles sur la barre d’outils Surface pour aider l’édition d’une surface:

Bouton	Commande de menu	Description
	Projet / Inclure point	Inclut un point dans le modèle de surface
	Projet / Exclure point	Exclut un point du modèle de surface
	Projet | Ajouter ligne	Supprime des parties de la surface qui se trouvent à l’extérieur d’une limite. Vous pouvez également définir une limite avec une ligne de c/p à l’aide de cet outil.
	Projet / Ajouter ligne	Supprime une partie de la surface qui se trouve à l’intérieur d’une limite. Vous pouvez également définir une limite avec une ligne de c/p à l’aide de cet outil.
	Projet / Ajouter ligne	Ajoute une ligne de c/p entre deux points
	Projet / Supprimer  ligne	Supprime une ligne de c/p ou une limite Appuyez sur la flèche à droite du bouton pour sélectionner le type de ligne à supprimer. Les options dans le menu déroulant sont: Tout Lignes de c/p Inclure limites Exclure limites Inclure limites et lignes de c/p Exclure limites et lignes de c/p
	Projet / Echanger triangles	Echange deux triangles adjacents qui forment un quadrilatère convexe
	Projet / Supprimer triangle	Exclut un triangle du modèle de surface

L’outil reste actif jusqu’à ce que vous sélectionnez un autre outil.


Menus de raccourcis

Utilisez le bouton droit de la souris pendant que vous êtes dans une fenêtre de graphiques pour afficher un menu de raccourcis. C’est un menu sensible au contexte avec des options différentes disponibles selon le contexte sur lequel vous cliquez avec le bouton droit de la souris

Les options de contexte principales disponibles sont:

Fenêtre de graphiques principale

Le menu de raccourcis dans la fenêtre de graphiques principale est:


Touches de raccourci

Afin de choisir toute commande du menu que vous accédez de la barre de menus, utilisez soit la souris soit le clavier .

ASTUCE: Pour la plupart des raccourcis, appuyez sur Alt puis la première lettre du nom de menu puis la première lettre de la commande. Vous pouvez également utiliser les raccourcis habituels de Microsoft Windows 95 pour les commandes les plus communes, telles que, Ouvrir, Enregistrer, Quitter et Annuler.

MENU	RACCOURCI DU CLAVIER
Fichier
Ouvrir	Ctrl + O
Enregistrer	Ctrl + S
Quitter	Alt + X
Edition
Annuler	Ctrl + Z
Affichage
Etendue de zoom	Ctrl + E
Rafraîchir	F5
Fenêtre Propriétés	Alt + Entrée
Projet
Mettre à jour la surface	F4
Menu de raccourcis
Mode de sélection	F2


Affichage des rapports

Le logiciel DTMLink™ génère des rapports (tels que les rapports de volume et de lignes de c/p qui se croisent).

Les rapports sont stockés par défaut dans C:\Trimble Geomatics Office\Projets\xx\Rapports\DTMLink\yy où xx est le nom du projet et yy est le nom de la surface.

Vous pouvez afficher le rapport plus tard en l'ouvrant dans l'Explorateur de Microsoft Windows à partir de ce dossier.


Remplir le champ

Utilisez remplir le champ à partir de toute fenêtre de graphiques  (y compris la fenêtre flottante) pour entrer des valeurs dans les champs des dialogues. Par exemple, pour entrer les valeurs dans le dialogue Exclure point, cliquez sur un point sur la surface. Dans les champs qui supportent remplir le champ, le pointeur dans la fenêtre de graphiques montre:

NOTE: Lorsque l’entité sélectionnée dans la fenêtre de graphiques ne peut pas fournir la valeur requise par le champ souligné, le champ dans le dialogue reste inchangé.

Appuyez sur la souris et la maintenez enfoncée pour effectuer un aperçu, trouver, et vérifier les valeurs avant la copie. Les champs afficheront les valeurs et la barre d’état affichera un résumé des entités pendant que vous faites glisser-déplacer la souris. Les valeurs ne sont copiées que lorsque vous relâchez la souris.

Certains champs se remplissent sous forme d’un groupe de valeurs. Un seul clique essayera de remplir tous les champs groupés. Par exemple, les champs de Constante nord et Constante est, en général, forment un groupe. Afin de remplir un seul champ, sélectionnez-le et avec la touche Alt enfoncée cliquez sur le champ.

L’activité du curseur se déplace au champ suivant après remplir le champ.

ASTUCES:

Maintenant la touche Ctrl enfoncée pendant l’utilisation de remplir le champ évitera un déplacement instantané aux entités et seulement les coordonnées seront choisies. Ainsi vous pouvez choisir des coordonnées près d’une entité.

Vous pouvez utilisez le commandes du menu Affichage (par exemple, Zoom et Déplacer) pour trouver des entités avec les valeurs requises pour remplir le champ. Une fois trouvées, vous devez retourner au champ originel avant de copier la valeur.


Barre de titres

La barre de titres s’étend le long de la partie en haut de l’écran, au-dessus de la barre de menus.


Barre de menus

La barre de menus est au-dessous de la barre de titres. Elle comporte les menus suivants:

Fichier

Edition

Affichage

Projet

Outils

Fenêtre

Aide

Choisissant une commande

Pour choisir une commande d’un menu, cliquez-la avec la souris

Raccourci du clavier

Vous pouvez utiliser une souris pour choisir toute commande de menu que vous accédez à partir de la barre de menus. Cependant, vous pouvez également utiliser le clavier.

Si vous préférez d’utiliser le clavier, appuyez sur Alt et la lettre soulignée correspondant au menu requis. A la suite, appuyez sur la lettre soulignée correspondant à la commande requise, ou utilisez les touches de page en haut ou de page en bas et appuyez sur Entrée  pour effectuer la sélection.

ASTUCE: Vous pouvez également utiliser les raccourcis habituels de Microsoft Windows 95 ou Windows 98  pour les commandes les plus communes, telles que Ouvrir et Enregistrer.

 Voir aussi


Barre d'état

La barre d’état affiche une variété de messages et fournit des réactions immédiates et concises concernant l’état courant du logiciel DTMLink™ .

La barre d’état s’affiche en bas de la fenêtre de graphiques principale du logiciel DTMLink. Référez- vous à la figure 1.

 Figure 1  Barre d’état

Panneau de messages

Le panneau de messages de la barre d’état affiche d’informations concernant l’opération du logiciel  DTMLink.

Ce panneau décrit les actions des éléments du menu lorsqu’ils sont soulignés. Par exemple, le message “Ouvre une surface” s’affiche pendant que la commande Fichier / Ouvrir surface est soulignée. Le panneau affiche également les messages décrivant les actions des boutons de la barre d’outils lorsqu’ils sont soulignés. Par exemple, le message “Déplace le centre de la surface de zoom” s’affiche lorsque vous mettez le curseur sur l’outil Déplacer sur la barre d’outils Affichage.

Panneau de coordonnées

Lorsque la souris est à l’intérieur d’une fenêtres de graphiques, les coordonnées correspondantes s’affichent.

Panneau d’étendues

Ce panneau affiche la largeur et la hauteur de la fenêtre de graphiques sur laquelle la souris se trouve.

Panneau des indicateurs

Le Panneau des indicateurs est souligné lorsqu’un changement a été effectué à la surface et qu’une mise à jour est requise. Une fois que des lignes de c/p ou des limites supplémentaires sont ajoutées à la surface, l’indicateur Mettre à jour la surface s’affiche dans le panneau (comme illustré dans la figure ci-dessus) et vous devez mettre à jour la surface.

Coin de la fenêtre

Le coin de la fenêtre vous permet de redimensionner la fenêtre de graphiques principale.


Astuces

Les rubriques suivantes sont disponibles:

Utilisation des barres d’outils

Menus de raccourcis

Touches de raccourci

Affichage des rapports

Remplir le champ

Barre de titres

Barre de menus

Barre d’état

Barre d’outils standard

Barre d’outils Affichage

Barre d’outils Surface


Rapport de volume
Outils / Rapport de volume

Utilisez cette commande pour créer un rapport de volume sur la surface courante.

Type de rapport

A partir de la case Type de rapport, choisissez le type de rapport de volume sur la surface courante.

Les types de Calcul de volume disponibles sont:

Au-dessus d’une élévation

Utilisez l’option Au-dessus d’une élévation pour les calculs des réserves.

NOTE: Il est supposé que la réserve est située sur une base horizontale.

Entre deux élévations

Utilisez l’option Entre deux élévations pour calculer les volumes des matériaux dans les couches horizontales.

Volume vide

Utilisez l’option Volume vide pour le calcul du volume “d’aire” entre deux élévations spécifiées. C’est à dire, le volume vide est le volume entre deux élévations de courbes de niveau spécifiées, qui n’est pas compris au-dessous de la section normale de la surface de courbes de niveau.

Elévation supérieure

L’élévation supérieure définit l'élévation la plus haute à laquelle il faut calculer le volume. La valeur par défaut affichée dans ce champ est le point le plus haut de la surface de courbes de niveau. Ce champ est disponible lorsque l’élévation supérieure est requise pour le calcul de volume.

ASTUCE: Cliquez sur Le plus haut afin de vous aider dans la sélection de la valeur d’élévation maximum de la section normale de la surface de courbes de niveau.

Elévation de base

L’élévation de base définit l'élévation la plus basse à laquelle il faut calculer le volume. La valeur par défaut dans ce champ est le point le plus bas de la surface de courbes de niveau.

ASTUCE: Cliquez sur Le plus bas afin de vous aider dans la sélection des valeurs d’élévation minimum de la section normale de la surface de courbes de niveau.

Contraction/Expansion

L’option Contraction/Expansion détermine si les volumes rapportés sont corrigés pour le resserrement des matériaux (contraction) ou l’expansion des matériaux (expansion). L’option bascule entre Contraction et Expansion.

NOTE: Pour les volumes bruts ( volume sans compaction ou expansion) entrez zéro comme la valeur dans le champ Pourcentage.

Pourcentage

Entrez le facteur actuel de compaction ou d’expansion (exprimé comme un pourcentage) dans le champ Pourcentage.

Par exemple, avec l’option Contraction sélectionnée et le champ de pourcentage avec une valeur de dix pour-cent (10%), le logiciel DTMLink™ rapportera le volume comme dix pour-cent  moins que le volume brut.

C’est à dire, avec un volume brut de 600 mètres cubiques, l’option de contraction sélectionnée, et un facteur de contraction de dix pour-cent, le logiciel DTMLink rapportera le volume comme 540 mètres cubiques.


Au-dessus d'une élévation

L’option Au-dessus d’une élévation calculera le volume au-dessus d’une élévation spécifiée au point le plus haut  de la surface de courbes de niveau. Les volumes des prismes triangulaires individuels définis par les plans triangulaires formant le modèle numérique de terrain (MNT) sont calculés.

La méthode peut calculer

  Volume au-dessus d’un plan (élévation de base spécifiée)

  Surface de plan

  Surface.

La figure 1 illustre la méthode de calcul par Volume prismoïdale.

Figure 1 Méthode de calcul par Volume prismoïdale

Le volume du prisme (Vp) est calculé à partir de l’équation de Volume du prisme:

où:

H1 est l’élévation du premier point

H2 est l’élévation du deuxième point

H3 est l’élévation du troisième point

BE est l’élévation du niveau de base

P est la Surface de plan.

La Surface de plan est la surface du triangle de surface projetée sur un plan.

La Surface de plan (P) est calculée à partir de l’équation de Surface de plan:

où:

est la longueur du triangle de base, calculée à partir des coordonnées de grille

est la hauteur du triangle de base, calculée à partir des coordonnées de grille

Le volume de chaque prisme triangulaire est calculé individuellement et puis le total est réalisé afin de fournir le volume total dans la surface des limites de la section normale.  Lorsqu’une élévation de base spécifiée passe à travers d’un triangle, le volume du prisme de la partie du triangle située au-dessus de l’élévation de base est calculé.

 Voir aussi


Exemple du calcul de volume au-dessus d'une élévation

Une application commune de la méthode du calcul de volume au-dessus d’une élévation est  le monitorage des centres d’enfouissement des déchets et d’autres sites semblables. Les étapes essentielles sont:

Etape 1. Définissez une limite commune pour la surface d’intérêt. Référez-vous à la figure 1.

Figure 1  Application de remplissage d’un site – Surface totale

Etape 2. Coupez la section normale de courbes de niveau originelle couvrant le site entier en utilisant un Inclure limite. Il faut que les données de courbes de niveau s’étendent au moins à l’Inclure limite défini.  Référez-vous à la figure 2.

Figure 2  Une partie de la section normale de surface originel

Etape 3. Calculez le volume entre l’élévation de base définie et la surface de courbes de niveau originelle. Référez-vous à la figure 3.

Figure 3  Volume au-dessous de la surface originelle

Etape 4. Formez la deuxième surface de courbes de niveau utilisant les points définissant la surface remplie. Coupez ce nouveau modèle de courbes de niveau en utilisant la définition Inclure limites originelle. A nouveau, les données de courbes de niveau doivent étendre au moins jusqu’à cette limite. Référez-vous à la figure 4.

Figure 4  Nouveau modèle de courbes de niveau

Etape 5. Calculez le volume entre la même élévation de base que celle utilisée pour la première surface et la nouvelle surface. Référez-vous à la figure 5.

Figure 5  Volume au-dessous de la nouvelle surface

Etape 6. Calculez le volume au-dessous de la surface originelle (référez-vous à 3 dans la figure 6) du volume au-dessous la nouvelle surface.

Figure 6  Le volume calculé

 Voir aussi


Entre deux élévations

L’option Entre deux élévations vous permet de calculer le volume entre une élévation supérieure et une élévation inférieure . La même méthode de calcul de volume utilise la méthode de calcul des volumes des prismes triangulaires comme expliquée dans la méthode Au-dessus d’une élévation.

L’option Entre deux élévations est utilisée pour le calcul du volume de la section normale de courbes de niveau sélectionné entre deux élévations de courbes de niveau spécifiées.

La figure 1 montre le volume à calculer entre deux élévations.

Figure 1  Volume entre deux élévations

Elévation supérieure

La figure 1 montre le volume au-dessus de l’élévation supérieure. C’est l’élévation au-dessus de laquelle le volume n’est pas requis. La valeur par défaut dans ce champ est le point le plus haut  dans la surface de courbes de niveau.

Entrez l’élévation au-dessous de laquelle il faut calculé le volume dans le champ Elévation supérieure.

Elévation de base

Le diagramme ci-dessus montre le volume au-dessus l’élévation inférieure. L’Elévation de base définit l’élévation niveau au-dessous de laquelle le volume n’est pas requis. La valeur par défaut dans ce champ est le point le plus bas dans la surface de courbes de niveau.

Entrez l’élévation au-dessus de laquelle il faut calculer le volume dans le champ Elévation de base.


Volume vide

Cette option est utilisée pour le calcul du volume “d’air” entre deux élévations spécifiées. C’est à dire, le volume vide est le volume entre deux élévations de courbes de niveau spécifiées que n’est pas compris au-dessous de la surface de la section normale de courbes de niveau.

Afin d’utiliser l’option Volume vide, spécifiez une élévation de base qui est au-dessous du fond de la section normale, et une élévation supérieure définissant la surface horizontale à laquelle vous voulez remplir. Voir la figure 8.

Figure 8 Calcul de volume vide

Le volume au-dessus de l’élévation de base est le volume total au-dessus de cette élévation-là (y compris le volume au-dessus de l’élévation supérieure).

Le volume vide est calculé en utilisant la formule suivante:

Volume vide = BA x (UE – BE) – (BV – UV)

où:

BA est la surface de plan au-dessus de l’élévation de base

UE est l’élévation supérieure

BE est l’élévation de base

BV est le volume au-dessus de l’élévation de base

UV est le volume au-dessus de l’élévation supérieure

Elévation supérieure

La figure 8 montre que l’élévation supérieure définit le haut du volume vide. La valeur par défaut affichée dans ce champ est le point le plus haut dans la surface de courbes de niveau.

Elévation de base

La figure 8 montre que l’élévation de base est au-dessous du fond du volume vide. La valeur par défaut affichée dans ce champ est le point le plus bas dans la surface de courbes de niveau.

 Voir aussi


Exemple de Volume vide

Typiquement il serait possible d’utiliser la méthode Volume vide dans le calcul d’eau derrière un projet de barrage de retenue.

Les étapes dans le calcul du volume des eaux sont:

Etape 1. Formez un modèle de courbes de niveau en utilisant les données définissant la surface au sol derrière le projet de barrage de retenue. Lors de la formation de la section normale de courbes de niveau, définissez un Inclure limite limitant la section normale de courbes de niveau à la surface dans laquelle l’eau derrière le barrage de retenue sera contenue. L’Inclure limite doit être défini le long de la face du projet de barrage de retenue. Ainsi s’assurant que le volume est derrière le barrage de retenue.

Etape 2. Calculez le Volume vide. En spécifiant le niveau d’eau requis comme le Niveau supérieur.

La figure 1 illustre un exemple de la surface sur laquelle un volume vide serait réalisé, ainsi qu’une coupe transversale d’exemple à travers le sommet du barrage de retenue illustrant le volume vide calculé.

Les résultats du volume vide donnent le volume d’eau entre l’élévation de base spécifiée (qui doit être sélectionné afin qu’il est plus bas que le point le plus profond derrière le barrage de retenue), et l’élévation supérieure (niveau de l’eau). Ce volume vide est, en effet, le volume que sera rempli d’eau se trouvant au-dessus de la surface mais au-dessous du niveau de l’eau spécifié et est donc le volume requis. Voir la figure 1.

Figure 1 : Exemple

 Voir aussi


Reconstruire la surface
Outils / Reconstruire la surface

Utilisez cette commande pour reconstruire la surface des points de surface d’origine. Tout point de surface ou triangle supprimé de la section normale de courbes de niveau sera restauré. Cette commande utilise les limites et les lignes de c/p créées après l’importation des points de surface d’origine.

ATTENTION: Les triangles qui sont échangés ou supprimés ne seront pas retenus après la reconstruction d’une surface. Les points exclus retournent après la reconstruction de la surface.


Comparer surfaces
Outils / Comparer surfaces

L'option Comparer surfaces vous permet de générer une comparaison surface à surface des deux surfaces sélectionnées. La surface résultante ou de comparaison fournira une surface à courbes de niveau de la différence des élévations entre la surface de base et la surface majeure. Vous pouvez utiliser la surface de comparaison pour calculer le volume entre les deux surfaces.

 Voir aussi

Surface majeure

Sélectionnez la Surface majeure requise de la liste déroulante. Utilisez le champ Dans le dossier pour sélectionner le dossier approprié comme requis.

 Voir aussi

Surface de base

Sélectionnez la Surface de base requise de la liste déroulante. Utilisez le champ Dans le dossier pour sélectionner le dossier approprié comme requis.

 Voir aussi

Nouvelle surface

Entrez le nom de la surface de comparaison. Le nom doit être unique au projet courant.

Méthode de comparaison

Sélectionnez la méthode de comparaison. Choisissez entre:

  Simple

  Détaillé

 Voir aussi


Calcul du volume entre deux surfaces

A l'aide de l'option Volume vide, il est possible de calculer les volumes de déblai et de remblai entre deux surfaces utilisant une surface de comparaison. L'Elévation de base est configurée le point le plus bas dans la section normale de courbes de niveau et l'Elévation supérieure est configurée sur zéro. Les lignes de courbes de niveau de zéro indiquent le point auquel il y a un changement d'une surface de déblai à remblai. Le total des volumes de toutes les surfaces de déblai est retourné dans le Volume vide entre l'Elévation de base et l'Elévation supérieure.

Lorsque le volume d'un surface spécifique de déblai ou de remblai est requis, on peut l'obtenir en définissant un Inclure limites autour de la surface pour laquelle le volume individuel est requis. Ensuite, la section normale est formée à nouveau et l'option Volume vide est utilisée sur ce modèle, avec encore une fois,  l'Elévation de base configurée sur le point le plus bas de la section normale et l'élévation supérieure configurée sur zéro. Lorsque la surface concernée est une surface de remblai, le volume de remblai sera retourné comme un volume au-dessus de l'Elévation supérieure. Lorsque le volume concerné est une surface de déblai, le volume de déblai calculé sera le Volume vide entre l'Elévation supérieure et l'Elévation de base.

 Voir aussi


Surfaces majeure et de base

La sélection de la surface majeure et la surface de base définit la direction des différences d'élévation.

C'est à dire, toute surface sur la surface majeure plus haute que la surface correspondante sur la surface de base s'affichera comme un surface d'élévation positive.

Toute surface sur la surface majeure plus basse que la surface de base s'affichera comme un surface d'élévation négative. Les surfaces que sont pas communes à toutes les deux surfaces ne s'afficheront sur la surface de comparaison.


Méthode de comparaison

Sélectionnez la méthode de comparaison.

Simple

C'est une comparaison de point à surface dans les deux sens. Tous les points sur les surfaces majeures ainsi que de base sont projetés sur l'autre surface, et une différence en élévation est calculée. Cette différence en élévation et la position de coordonnée forment les coordonnées de la section normale pour la surface de comparaison. Lorsqu'on a effectué les courbes de niveau, la surface de comparaison représentera le rapport de déblai à remblai entre les surfaces comparées. Référez-vous à la figure 1.

 Figure 1 : Comparaison de surface simple

Détaillé

D'abord un comparaison détaillée effectue le même procédé qu'une comparaison simple. En plus, la comparaison détaillée formera une coordonnée de comparaison à chaque intersection d'un côté de triangle d'une surface, avec le côté du triangle de l'autre surface, dans le plan horizontal. A l'aide de ce modèle la quantité maximum d'informations peut être dérivée des deux modèles. La surface de comparaison résultante est plus détaillée car elle utilise les formations de triangle (et donc utilisant d'information de lignes de c/p) des deux surfaces. La méthode détaillée aura besoin de plus de temps que la méthode simple.  Référez-vous à la figure 2.

Figure 2 : Comparaison de surface détaillée

NOTE: Toutes les lignes de c/p et de limites sur les surfaces de base et majeures seront ignorées dans le traitement de la surface de comparaison. Si les limites sont requises, il faut les ajouter après l'opération Comparer et il y aura besoin ensuite de mettre à jour la surface de comparaison. Il n'est pas possible de définir les lignes de changement de pente sur une surface de comparaison. En utilisant Ajouter ligne, vous pouvez inclure les lignes de changement de pente sur une mise à jour de la surface de comparaison, mais le résultat sera incorrect  et sans signification. C'est à cause du fait que la surface de comparaison est modelée sur des points de surface dont l'élévation est les différences entre les points de base de données et  les lignes de c/p ne peuvent être définies qu'avec les points de base de données.


Menu Outils

Utilisez le menu Outils pour effecteur les calculs et travailler avec les données. Il a les commandes suivantes:

Rapport de volume

Reconstruire la surface

Comparer surfaces


Zoom avant
Affichage / Zoom avant

	Cliquez sur l’outil Zoom avant sur la barre d’outils Affichage
Utilisez cet outil pour examiner de près une section de la fenêtre de graphiques.

Avec l’outil Zoom avant sélectionné:

1.	Déplacez le pointer à travers la fenêtre de graphiques. Le pointer à loupe s’affiche entourant un signe de plus. Les réticules au-dessus le pointeur à loupe indique le point chaud.

2.	Effectuez l’une des choses suivantes:

•	Cliquez sur une position dans la fenêtre de graphiques pour effectuer un zoom avant par un facteur de deux, centré sur le point chaud.

•	Cliquez et faites glisser-déplacer le pointeur à travers la fenêtre de graphiques afin de produire un rectangle contenant la surface sur laquelle vous voulez faire un Zoom avant. La plus petite la surface, les plus grandes les changements d'échelle. Le contenu de la surface contenue par le rectangle occupera la fenêtre de graphiques entière lorsque le bouton de la souris est relâché.

NOTES:

Appuyez sur  Echap pendant que le bouton gauche de la souris est enfoncé pour annuler l’opération courante de l’outil Zoom avant.

En maintenant la touche Maj enfoncée pendant la réalisation de l’opération de Zoom, une fenêtre flottante de la surface de zoom s’ouvrira.


Zoom arrière
Affichage / Zoom arrière

	Cliquez sur l’outil Zoom arrière sur la barre d’outils Affichage
Utilisez cet outil pour afficher une surface plus grande sur une fenêtre de graphiques.

Avec l’outil Zoom arrière sélectionné:

1.	Déplacez le pointeur à travers la fenêtre de graphiques. Le pointeur à loupe s’affiche entourant un signe de moins. Les réticules au-dessus du pointeur à loupe indique le point chaud

2.	Effectuez l’une des choses suivantes:

•	Cliquez sur une position dans la fenêtre de graphiques pour effectuer un zoom arrière par un facteur de deux, centré sur le point chaud

•	Cliquez et faites glisser-déplacer le pointeur à travers la fenêtre de graphiques afin de produire un rectangle contenant la surface sur laquelle vous voulez faire un Zoom arrière puis relâchez le bouton de la souris. L’échelle de la fenêtre de graphiques changera, et la surface contenue précédemment dans le rectangle s’affichera. Pour annuler le Zoom arrière, retournez au point à partir duquel vous avez commencé de glisser-déplacer avant de relâcher le bouton de la souris.

NOTES:

Appuyez sur Echap pendant que le bouton gauche de la souris est enfoncé pour annuler l’opération courante de l’outil Zoom arrière.

Cliquez et faites glisser-déplacer un rectangle sur la fenêtre de graphiques. Lorsqu’une opération de Zoom arrière est effectuée, l’affichage précédent est contenu dans le rectangle. Le plus petit le rectangle, les plus grands les changements d’échelle.


Déplacer
Affichage / Déplacer

	Cliquez sur l’outil Déplacer sur la barre d’outils Affichage

Utilisez cet outil pour déplacer le contenu de la fenêtre de graphiques afin d’afficher une partie différente de l’affichage sur l’écran. L’outil Déplacer  déplace l’origine de l’affichage.

Une fois que vous avez sélectionné l’outil Déplacer:

1.	Déplacez le pointeur à travers la fenêtre de graphiques. Le pointeur à main s’affiche. Les réticules au-dessus du pointeur à main indique le point chaud.

2.	Effectuez l’une des choses suivantes:

•	Cliquez sur une position dans la fenêtres de graphiques. Cette position devient le nouveau centre de la fenêtre.

•	Cliquez et faites glisser-déplacer le pointeur à main dans la direction et pour la distance que vous voulez vous déplacer. Une ligne s’affiche indiquant la direction et la distance par lesquelles l’écran doit se déplacer. Relâchez le bouton. L’affichage de l’écran se déplace à cette nouvelle position. Pour annuler le déplacement, retournez le pointeur à main au point à partir duquel vous avez commencé le glisser-déplacer avant de relâcher le bouton de la souris.

NOTE: Pour annuler l’opération courante de l’outil Déplacer, appuyez sur Echap avec le bouton gauche de la souris enfoncé.


Déplacer vers
Affichage / Déplacer vers

Utilisez ce dialogue pour vous déplacer vers et mettre à l’échelle  une position particulière sur la fenêtre de graphiques.

Le dialogue Déplacer vers s’ouvre.

Centre de l’affichage

Ce groupe de champs vous permet de compléter les actions de remplir le champ, telle que la spécification d’un nom ou d’une position pour le centre de l’affichage.

Nom de point	Utilisez ce champ pour entrer le nom de point du point au centre de l’affichage. Les champs de Constante nord et Constante est se mettront à jour automatiquement.
Est/Nord	Utilisez ces champs pour trouver le centre de l’affichage, si vous ne connaissez pas le nom du point.

Rayon à afficher

Le champ Rayon à afficher configure la position de l’affichage courant.

Le centre de l’écran se déplace par la distance du rayon spécifiée. La distance dépend de l’orientation de la fenêtre de graphiques. Voir la figure 1.

Figure 1 : Orientation sur l’écran


Etendue de zoom
Affichage / Etendue de zoom

	Cliquez sur l’outil Etendue de zoom sur la barre d’outils Affichage
Utilisez cette commande pour afficher tous les points visibles dans le projet courant.

Lorsque vous sélectionnez la commande Etendue de zoom, la fenêtre de graphiques s’ajuste automatiquement afin que toutes les données sont visibles.


Vue précédente
Affichage / Vue précédente

	Cliquez sur l’outil Vue précédente sur la barre d’outils Affichage
Utilisez cette commande pour repasser à travers chacune des vues précédentes.


Fenêtre flottante
Affichage / Fenêtre flottante

	Cliquez sur l’outil Fenêtre flottante sur la barre d’outils Affichage.

Utilisez cette commande pour afficher la Fenêtre flottante. Lorsqu’ouverte, la Fenêtre flottante reste toujours en premier plan.

La fenêtre flottante fournit un autre affichage. De la même façon que les autres fenêtres de graphiques, vous pouvez utiliser remplir le champ et effectuer un zoom pendant que vous êtes dans la Fenêtre flottante.

Cela signifie, par exemple, que vous pouvez utiliser la fenêtre flottante comme un outil afin de fournir une vue générale  ou une vue grossie indépendantes de la fenêtre de graphiques.  Toutes les deux fenêtres peuvent être utilisées pour les opérations normales ( telles que remplir le champ ou pour  effectuer un zoom).

NOTE: Affichage / Zoom à l’étendue fonctionne dans la fenêtre de graphiques. Si vous voulez effectuer un Etendue de zoom dans la fenêtre de graphiques, cliquez sur le menu de raccourcis.

Pour obtenir une vue grossie dans la fenêtre flottante, spécifiez dans la fenêtre de graphiques la surface à grossir en appuyant sur Maj et faisant glisser-déplacer l’outil Zoom avant.

Pour obtenir une vue grossie dans la fenêtre de graphiques, spécifiez dans la fenêtre flottante la surface à afficher en appuyant sur Maj et faisant glisser-déplacer l’outil Zoom arrière. Cela illustre comment la fenêtre flottante peut être utilisée comme une vue générale.

NOTE: La barre de titres de la fenêtre flottante s’affiche comme active lorsque la fenêtre de graphiques associée est active.


Barres d'outils
Affichage / Barres d’outils

Utilisez cette commande pour afficher ou masquer toute barre d’outils.

Chacune des barres d’outils est une série d’outils affichés sous forme de boutons. Chaque outil est disponible comme une commande de menu.

Barres d’outils

Sélectionnez la coche pour afficher ou masquer chaque barre d’outils. Une coche indique visibilité.

Fermer

Cliquez sur Fermer pour quitter le dialogue.

Tous

Cliquez sur Tous pour afficher toutes les barres d’outils.

Aucun

Cliquez sur Aucun pour masquer toutes les barres d’outils.

Remettre

Cliquez sur Remettre pour restaurer les barres d’outils à la configuration par défaut.

  Voir aussi


Couches
Affichage / Couches

	Utilisez l’outil Visibilité de couche sur la barre d’outils Affichage.
Utilisez cette commande pour masquer ou afficher les couches dans l’affichage courant.

Lorsque vous affichez ou masquez une couche particulière, le logiciel DTMLink™ affiche ou masque les entités dans cette couche.

NOTE: L’affichage ou le masquage d’une couche dans le logiciel DTMLink est la même chose que l’activation ou la désactivation d’une couche dans AutoCAD. La désactivation d’une couche de lignes de c/p ne la rend pas non valide pour l’utilisation dans la mise à jour de la surface. Il n’a aucun effet sur le modèle de surface, seulement l’affichage.

Couches

La liste Couche affiche les noms de toutes les couches dans le projet. Une coche indique que la couche est visible. Sélectionnez la coche d’une couche particulière afin de la basculer entre activée et désactivée.

Tous

Cliquez sur Tous pour afficher toutes les couches dans la liste.

Tous

Cliquez sur Tous pour afficher toutes les couches dans la liste.

Aucun

Cliquez sur Aucun pour masquer toutes les couches dans la liste.

ASTUCE: Lorsque toutes les couches sont masquées aucune entité ne s’affiche sur l’écran.

NOTE: L’indicateur Couches dans le panneau Indicateurs est souligné lorsqu’une couche est désactivée.


Rafraîchir
Affichage / Rafraîchir

Utilisez cette commande pour rafraîchir l’écran.

Choisissez cette commande (ou appuyez sur F5) pour redessiner l’affichage de graphiques lorsque la fenêtre de graphiques devient écrasée ou difficile à lire.


Options
Affichage / Options

Utilisez cette commande pour ajuster comment les courbes de niveau et les triangles s’affichent dans la fenêtre de graphiques.

Vous pouvez:

  afficher ou masquer l’affichage des courbes de niveau et des triangles

  changer les intervalles majeur et mineur des courbes de niveau

  éditer les couleurs des courbes de niveau et des triangles

  éditer les types de ligne des courbes de niveau et des triangles

  éditer la méthode de traçage de la courbe de niveau

Les tabulations dans le dialogue Options affichent les paramètres que vous pouvez changer dans le logiciel DTMLink™.

Les tabulations sont:

Options de ligne

Expert


Options de ligne

Utilisez la tabulation Options de ligne dans le dialogue Options pour spécifier comment les triangles et les courbes de niveau s’affichent dans la fenêtre de graphiques.

Afficher courbes de niveau

Utilisez le groupe Afficher courbes de niveau pour configurer les options de ligne pour les courbes de niveau. Sélectionnez la case à cocher Afficher courbes de niveau afin d’afficher les courbes de niveau dans la fenêtre de graphiques. Effacez la case à cocher Afficher courbes de niveau pour masquer les courbes de niveau.

Intervalle	Configurez l’intervalle pour les courbes de niveau majeur et mineur.

ASTUCE: Utilisez une couleur diverse pour l’affichage des Intervalles majeur et mineur. Ainsi vous pouvez visualiser rapidement les changements de l'élévation.

Les unités spécifiées dans ce champ sont les unités configurées dans le logiciel Trimble Geomatics Office™.

Vous ne pouvez pas configurer un intervalle mineur sur une valeur qui dépasse celle de l’intervalle majeur. L’intervalle majeur doit être un multiple de l’intervalle mineur.

Couleur pos	Configurez la couleur d’affichage des courbes de niveau qui sont au-dessus de zéro. Sélectionnez une couleur de la liste.

Utilisez une couleur diverse pour l’affichage des Intervalles majeur et mineur. Ainsi vous pouvez visualiser rapidement les changements de l'élévation.

Couleur neg 	Configurez la couleur d’affichage des courbes de niveau qui sont au-dessous de zéro. Sélectionnez une couleur de la liste.

Utilisez une couleur diverse pour l’affichage des Intervalles majeur et mineur. Ainsi vous pouvez visualiser rapidement les changements de l'élévation.

Type de ligne	Choisissez un type de ligne de la liste.

Afficher triangles

Utilisez le groupe Afficher triangles pour configurer les options de ligne des triangles. Sélectionnez la case à cocher Afficher triangles pour afficher les triangles dans la fenêtre de graphiques. Effacer la case à cocher Afficher triangles afin de masquer les triangles.

Couleur	Ce champ configure la couleur d’affichage des triangles. Sélectionnez une couleur de la liste. Cette couleur indiquera les bords des triangles.

Type de ligne	Choisissez un type de ligne de la liste.

Appliquer

Cliquez sur Appliquer pour appliquer les changements et maintenir le dialogue Options ouvert.

OK

Cliquez sur OK pour appliquer les changements et quitter le dialogue.


Options avancées

Utilisez la tabulation Expert dans le dialogue Options pour définir l’étendue de courbes de niveau et comment elles s’affichent dans la fenêtre de graphiques.

Dessiner les courbes de niveau comme lignes

Sélectionnez l’option Dessiner les courbes de niveau comme lignes pour afficher des lignes droites entre chaque triangle dans le modèle.

Dessiner les courbes de niveau comme courbes

Sélectionnez l’option Dessiner les courbes de niveau comme courbes pour afficher une courbe de niveau plus réaliste entre chaque triangle dans le modèle.

Utilisez le slider de resserrement de courbe pour spécifier à quel degré la courbe est droite. C’est à dire, fixant le slider au resserrement de courbe maximum produira une ligne droite. En général la position par défaut du slider produit des courbes plaisantes à voir.

ASTUCE: Utilisez le slider pour contrôler des situations anormales lorsqu’une courbe de niveau a traversé une autre à cause du lissage des courbes.

Afficher toutes les courbes de niveau

Sélectionnez l’option Afficher toutes les courbes de niveau pour afficher toutes les courbes de niveau dans le modèle.

Afficher les courbes de niveau entre

Sélectionnez l’option Afficher les courbes de niveau entre pour afficher toutes les courbes de niveau dans l’étendue d'élévation spécifiée.

Elévation minimum	Entrez l'élévation minimum des courbes de niveau à afficher dans le champ Elévation minimum. La valeur qui s’affiche par défaut est le point le plus bas enregistré dans le modèle.

ASTUCE: Cliquez sur Le plus haut pour sélectionner la valeur d'élévation maximum.

Elévation maximum	Entrez l'élévation maximum des courbes de niveau à afficher dans le champ Elévation maximum. La valeur qui s’affiche par défaut est le point le plus haut enregistré dans le modèle.

ASTUCE: Cliquez sur  Le plus bas pour sélectionner la valeur d'élévation minimum.

Appliquer

Cliquez sur Appliquer  pour appliquer les changements et maintenir le dialogue Options ouvert.

OK

Cliquez sur OK pour appliquer les changements et quitter le dialogue.


Propriétés
Affichage / Propriétés

	Cliquez sur l’outil Propriété sur la barre d’outils standard

Utilisez la fenêtre Propriétés pour afficher les propriétés de chaque élément.

NOTE: Vous ne pouvez pas éditer les entités dans la fenêtre Propriétés. Pour éditer les éléments, retournez au logiciel de Geomatics Office™ et utilisez la fenêtre Propriétés pour éditer les entités. Créez une nouvelle surface en utilisant les entités éditées.

La fenêtre Propriétés affiche le nom et les valeurs appropriées de l’entité sélectionnée.

ASTUCE: Afin de redimensionner la fenêtre Propriétés, cliquez et faites glisser-déplacer le bord de la fenêtre. Pour redimensionner la séparation dans la fenêtre cliquez et faites glisser-déplacer la barre de séparation.


Fenêtre Propriétés

La fenêtre Propriétés vous permet d’afficher les propriétés de chaque élément. Vous ne pouvez pas éditer les propriétés. Elle affiche les noms et les valeurs appropriés de l’élément.

NOTE: Vous ne pouvez sélectionner qu’un élément à la fois.


Menu Affichage

Le menu Affichage fournit des commandes pour le contrôle et le maintenue de l’affichage de la surface de courbes de niveau dans la fenêtre de graphiques. Les commandes suivantes sont disponibles:

Zoom avant

Zoom arrière

Déplacer

Déplacer vers

Etendue de zoom

Vue précédente

Fenêtre flottante

Barres d’outils

Couches

Rafraîchir

Options

Propriétés


Nouvelle fenêtre
Fenêtre / Nouvelle fenêtre

Utilisez cette commande pour ouvrir une autre fenêtre pour le projet courant

Utilisez cette commande pour ouvrir une nouvelle fenêtre ayant le même contenu que la fenêtre active. Vous pouvez ouvrir des fenêtre multiples afin d’afficher différentes parties ou  vues d’une définition de route en même temps. Si vous changez le contenu d’une fenêtre, toutes les autres fenêtres contenant le même affichage graphique refléteront ces changements. Lorsque vous ouvrez une nouvelle fenêtre, elle devient la fenêtre active et elle s’affiche sur toutes les autres fenêtres ouvertes.


Cascade
Fenêtre / Cascade

Utilisez cette commande pour redimensionner les fenêtres et les dialogues ouverts sur le bureau et les réorganiser de façon chevauchant d’en haut à gauche jusqu’à en bas à droite.

Lorsque vous mettez le fenêtres en cascade, elles sont réorganisées en couches et vous pouvez voir la barre de titres de la fenêtre pour toutes les fenêtres sur le bureau.


Mosaïque
Fenêtre / Mosaïque

Utilisez cette commande pour déplacer et redimensionner les fenêtres et les dialogues ouverts sur le bureau et les réorganiser afin de former un modèle en mosaïque.


Réorganiser les icônes
Fenêtre / Réorganiser les icônes

Utilisez cette commande pour réorganiser toute icône d’une fenêtre réduite dans un format rangé sur l’écran. Les icônes sont réorganisées au bas de la fenêtre.


Liste des fenêtres
Fenêtre / Liste des fenêtres

Utilisez la section inférieure de ce menu pour afficher une liste des fenêtres ou des dialogues actuellement ouverts sur le bureau. La fenêtre ou le dialogue actif est coché.

Sélectionner le nom d’une fenêtre particulière afin de l’activer.


Menu des fenêtres

Le menu Fenêtre contient les commandes pour l’affichage des options. Les commandes suivantes sont disponibles:

Nouvelle fenêtre

Cascade

Mosaïque

Réorganiser les icônes

Liste des fenêtres sur l’écran


Limites qui se croisent

Lorsque les limites qui se croisent sont détectées, le message suivant s’affiche:

Limites qui se croisent détectées. Voulez-vous afficher le rapport?

Cliquez sur Oui pour afficher le rapport.

Le rapport de Limites qui se croisent montre les deux lignes qui se croisent. Il décrit les lignes qui se croisent en utilisant un nom de point, les coordonnées de nord et est au début de la ligne, et les coordonnées de nord et est à la fin de la ligne.

Un rapport de Limites qui se croisent est semblable à l’exemple suivant:

Rapport de limites qui se croisent

Etude DTMLink travaux pratiques

Nom d'étude	DTMLink travaux pratiques
Surface	Surface1
Unités	Mètres
Date imprimée	29/07/99 11:56am
Limites qui se croisent détectées

               Point        Nord         Est         Elévation

Ligne de          187     4408.302     2482.427      119.708

       à          179     4430.895     2442.447      119.694   se croise

Ligne de          181     4443.678     2465.296      119.722

       à          187     4408.302     2482.427      119.708

Le rapport est stocké dans votre dossier de rapports (C:\Trimble Geomatics Office\Projets\xx\Rapports\DTMLink\yy  où xx  est le nom du projet et yy est le nom de la surface.

 Vous pouvez afficher le rapport plus tard en l'ouvrant dans l'Explorateur de Microsoft Windows à partir de ce dossier.


Lignes de changement de pente qui se croisent

Lorsque les lignes de changement de pente sont détectées, le message suivant s’affiche:

Lignes de c/p qui se croisent détectées. Voulez-vous afficher le rapport?

Cliquez sur Oui pour afficher le rapport.

Le rapport de Lignes de c/p qui se croisent montre les deux lignes qui se croisent. Il décrit les lignes qui se croisent en utilisant un nom de point, les coordonnées de nord et est au début de la ligne, et les coordonnées de nord et est à la fin de la ligne.

Un rapport de Lignes de c/p qui se croisent est semblable à l’exemple suivant:

Rapport de lignes de c/p qui se croisent

Etude DTMLink travaux pratiques

Nom d'étude	DTMLink travaux pratiques
Surface	Surface1
Unités	Mètres
Date imprimée	28/07/99 3:23pm
Lignes de c/p qui se croisent détectées

 Point        Nord         Est      Elévation

Ligne de           38     4456.360     2461.687      110.358

       à          187     4408.302     2482.427      119.708   se croise

Ligne de          182     4447.684     2476.296      120.100

       à          181     4443.678     2465.296      119.722

Ligne de          190     4411.104     2461.389      118.697

       à          183     4442.452     2486.146      120.193   se croise

Ligne de           38     4456.360     2461.687      110.358

       à          187     4408.302     2482.427      119.708

Le rapport est stocké dans votre dossier de rapports (C:\Trimble Geomatics Office\Projets\xx\Rapports\DTMLink\yy  où xx  est le nom du projet et yy est le nom de la surface.

Vous pouvez afficher le rapport plus tard en l'ouvrant dans l'Explorateur de Microsoft Windows à partir de ce dossier.


Coordonnées ajustées

Lorsqu’une ligne de c/p passe très près d’un point de surface, la hauteur de ce point tout près est modifiée à une valeur de hauteur interpolée de la ligne de c/p. Cet événement se produit afin d’éviter que les courbes de niveau peu communes soient forcées à la ligne de c/p du point tout près.

Si vous ne voulez pas ajuster ce point, vous pouvez changer le nord et l’est afin que le point soit légèrement au large de la ligne de c/p.

Après le système DTMLink  a ajusté les coordonnées, le message suivant s’affiche:

Point de coordonnée ajusté, voulez-vous afficher le rapport?

Cliquez sur Oui pour afficher le rapport.

Le rapport des Coordonnées ajustées montre les détails de coordonnées du point ajusté et les détails de coordonnées révisés.

Un rapport des Coordonnées ajustées est semblable à l’exemple suivant:

Rapport de coordonnées ajustées

Etude DTMLink travaux pratiques

Nom d'étude	DTMLink travaux pratiques
Surface	Surface1
Unités	Mètres
Date imprimée	28/07/99 2:37pm
Coordonnées ajustées

Point de coordonnée ajusté

élévation configurée sur l’élévation de ligne de c/p interpolée

                                 Point           Nord            Est       Elévation

Détails de coordonnées: 2453        4573.147        5734.531          23.000

Détails de coordonnées révisés:       2453        4573.147        5734.531          53.798

Le rapport est stocké dans votre dossier de rapports (C:\Trimble Geomatics Office\Projets\xx\Rapports\DTMLink\yy  où xx  est le nom du projet et yy est le nom de la surface.

Vous pouvez afficher le rapport plus tard en l'ouvrant dans l'Explorateur de Microsoft Windows à partir de ce dossier.


Point en double

Pendant la création de la surface de courbes de niveau tous les points sont vérifiés pour les coordonnées de nord et est en double. Si les points en double sont trouvés le logiciel DTMLink™  conserve le point le plus récent et écarte les autres points.

Un exemple d’un rapport de Points en double suit:

Rapport de points en double

Etude DTMLink travaux pratiques

Nom d'étude	DTMLink travaux pratiques
Surface	Surface1
Unités	Mètres
Date imprimée	28/07/99 4:02pm
Points en doubles lus

                Point          Nord           Est      Elévation

Point conservé:               55138       4452.923       2487.237         55.912

Point écarté:                138       4452.923       2487.237        116.912

Point conservé:                1877       4408.302       2482.427         19.708

Point écarté:                187       4408.302       2482.427        119.708

Le rapport est stocké dans votre dossier de rapports (C:\Trimble Geomatics Office\Projets\xx\Rapports\DTMLink\yy  où xx  est le nom du projet et yy est le nom de la surface.

Vous pouvez afficher le rapport plus tard en l'ouvrant dans l'Explorateur de Microsoft Windows à partir de ce dossier.

NOTE: Le logiciel DTMLink ne prend pas en charge les faces verticales.


Tolérance de courbe

Les courbes et les arcs peuvent définir des limites et des lignes de c/p.

Afin de permettre les calculs de triangle avec les lignes de c/p et les limites qui sont les courbes et les arcs, la courbe ou l’arc est représenté comme une série de petits segments de ligne.

La longueur du segment de ligne est contrôlée par une Tolérance de courbe. Une Tolérance de courbe est la distance maximum permise à partir de tout point le long de la série de segments de ligne vers la courbe ou l’arc, à un segment perpendiculaire à la ligne.

La Tolérance de courbe est réglée à 0.02 mètres.


Messages d'erreur

Coordonnées ajustées

Lignes de c/p qui se croisent

Limites qui se croisent

Point en double

Noms de point non valides

Coordonnée ne se trace pas à un point


Nom de point non valide

Lorsqu’un nom de point non valide est saisi dans un dialogue, il y aura le message d’erreur suivant:

X n’est pas un nom de point valide

Où  X est est le nom de point.

Vous devez entrer un nom de point qu’a été défini comme partie de la section normale de surface de courbes de niveau. Si vous avez besoin d’un point que n’a pas été défini initialement:

1.	Retournez à l’écran de Trimble Geomatics Office.

2.	Sélectionnez la commande du menu Outils/ DTMLink / Surface existante.

Le dialogue Surface existante s’affiche.

3.	Ajoutez des nouveaux points à la surface.

Pour plus amples informations, référez-vous à l’Aide en ligne du logiciel Trimble Geomatics Office™.


Coordonnée ne se trace pas au point

Si les coordonnées ne correspondant pas aux coordonnées d’un point de surface courant sont saisis dans un dialogue, le message d’erreur s’affiche:

Coordonnée ne se trace pas au point

Vous devez entrer des coordonnées d’un point existant dans le champ Nord et Est.

Si vous avez besoin des coordonnées que vous avez saisi:

1.	Retournez à l’écran de Trimble Geomatics Office.

2.	Ajoutez un nouveau point ayant les coordonnées requises si elles n’existent pas.

3.	Sélectionnez la commande du menu Outils / DTMLink / Surface existante.

Le dialogue Surface existante s’affiche.

4.	Ajoutez des nouveaux points à la surface.

Pour plus amples informations concernant le dialogue Surface existante, référez-vous à l’Aide en ligne du logiciel Trimble Geomatics Office™.


Inclure point

Utilisez l’outil Inclure point [image] sur la barre d’outils Surface ou dans la commande Projet  / Inclure point pour inclure un point dans la Section normale de surface de courbes de niveau.

Projet / Inclure point

Utilisez cette commande pour ouvrir le dialogue Inclure point. Le dialogue Inclure point n’est disponible qu’à partir de la commande de menu.

Le curseur change en [image] lorsque le dialogue Inclure point est actif.

Utilisez les champs dans le dialogue Inclure point pour sélectionner le point à inclure dans la surface.

Point à inclure

Utilisez le groupe Point à inclure pour entrer le nom du point ou les coordonnées de nord et est du point à inclure dans la surface.

Nom de point

Utilisez le champ Nom de point pour identifier le point à inclure. Si c’est un nom de point de surface valide, les champs Nord et Est sont remplis automatiquement.

NOTE: Lorsque vous entrez un nom de point de surface non valide, un message d’erreur s’affichera:

X n’est pas un nom de point valide

Où X est le nom de point.

Nord / Est

Utilisez ces champs pour entrer les coordonnées du point de surface lorsque vous ne connaissez pas le nom de point.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est du point dans le groupe Point à inclure.

NOTE: Lorsque vous entrez des coordonnées qui ne correspondent pas aux coordonnées d’un point de surface valide, un message d’erreur s’affichera:

 Coordonnée ne se trace pas au point

Appliquer

Cliquez sur Appliquer pour mettre à jour la surface et remettre le dialogue si vous voulez entrer une autre point à inclure.

Lorsque vous voulez inclure seulement un point, cliquez sur OK afin de mettre à jour la surface automatiquement et fermer le dialogue.

Outil Inclure point

Cliquez sur l’outil Inclure point [image] sur la barre d’outils Surface pour inclure un point que ne forme pas une partie de la surface.

Le curseur change en [image] lorsque l’action Inclure point est active.

Sélectionnez le point à inclure de la fenêtre de graphiques.

L’action Inclure point met à jour la surface automatiquement.

AVERTISSEMENT: Lorsqu’un triangle a été supprimé avant le point que vous êtes en train d’inclure maintenant, le triangle est formé à nouveau.

ASTUCE: Utilisez Edition /  Annuler pour renverser l’action Inclure point.


Exclure point

Utilisez l’outil Exclure point [image] sur la barre d’outils Surface ou la commande Projet / Exclure point pour exclure un point du de la section normale de surface de courbes de niveau.

Projet  / Exclure point

Utilisez cette commande pour ouvrir le dialogue Exclure point. Le dialogue Exclure point n’est disponible qu’à partir de la commande de menu.

Le curseur change en [image] lorsque le dialogue Exclure point est actif.

Utilisez les champs dans le dialogue Exclure point pour sélectionner la point à exclure de la surface.

Point à exclure

Utilisez le groupe Point à exclure pour entrer le nom de point ou les coordonnées de nord et est  du point à exclure de la surface.

Nom de point

Utilisez le champ Nom de point pour identifier le point à exclure. Si c’est un nom de point de surface valide, les champs Nord et Est sont remplis automatiquement.

NOTE: Lorsque vous entrez un nom de point de surface non valide, un message d’erreur s’affichera:

X n’est pas un nom de point valide

Où  X est le nom de point.

Nord / Est

Utilisez ces champs pour entrer les coordonnées du point de surface lorsque vous ne connaissez pas le nom de point.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est du point dans le groupe Point à inclure.

NOTE: Lorsque vous entrez des coordonnées qui ne correspondent pas aux coordonnées d’un point de surface valide, un message d’erreur s’affichera:

 Coordonnée ne se trace pas au point

Appliquer

Cliquez sur Appliquer pour mettre à jour la surface et remettre le dialogue si vous voulez entrer une autre point à inclure.

Lorsque vous voulez inclure seulement un point, cliquez sur OK afin de mettre à jour la surface automatiquement et fermer le dialogue.

Outil Exclure point

Cliquez sur l’outil Exclure point [image] sur la barre d’outils Surface pour empêcher l’utilisation d’un point dans la  section normale de surface.

Le curseur change en [image] lorsque l’action Exclure point est active.

Sélectionnez le point à exclure de la fenêtre de graphiques.

Avec cette option, vous n’avez pas besoin de mettre à jour la surface. L’action Exclure point met à jour la surface automatiquement.

NOTE: Un message d’erreur s’affichera si vous sélectionnez un point que n’est pas une partie de la surface.

ASTUCE: Utilisez Edition / Annuler pour renverser l’action Exclure point.

Un exemple d’une situation où l’action Exclure point serait utile est lorsqu’un point a produit des courbes de niveau irrégulières à cause du fait qu’il était inexact. Vous pouvez utiliser cette action pour ignorer le point.


Echanger les triangles

Utiliser l’outil Echanger triangles  [image] sur la barre d’outils Surface ou la commande Projet | Echanger triangles afin d’échanger deux triangles dans la section normale de surface de courbes de niveau.

Projet / Echanger triangles

Utilisez cette commande pour ouvrir le dialogue Echanger triangles. Le dialogue Echanger triangles n’est disponible qu’à partir de la commande de menu.

Le curseur change en [image] lorsque le dialogue Echanger triangles est actif.

Utilisez les champs dans le dialogue Echanger triangles pour sélectionner les triangles à échanger dans la surface.

Premier triangle

Utilisez le groupe Premier triangle pour identifier le premier triangle à échanger.

Nord / Est

Entrez toute coordonnée dans le triangle afin d’identifier le premier triangle à échanger.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est.

Deuxième triangle

Utilisez le groupe Deuxième triangle pour identifier le deuxième triangle à échanger.

Nord / Est

Entrez toute coordonnée dans le triangle afin d’identifier le deuxième triangle à échanger.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de Nord et Est.

Appliquer

Cliquez sur Appliquer pour échanger les triangles qui forment des quadrilatères.

Cliquez sur OK  pour échanger les triangles et fermer le dialogue.

ASTUCE: Utilisez Edition / Annuler pour renverser l’action Echanger triangles.

Outil Echanger triangles

Cliquez sur l’outil Echanger triangles [image] sur la barre d’outils Surface afin de changer la section normale de surface en échangeant les triangles.

Le curseur change en [image] lorsque l’action Echanger triangles est active.

Sélectionnez le premier triangle à échanger. Ce triangle s’affiche sur l’écran en vert.

Sélectionnez le deuxième triangle. Si les deux triangles sélectionnés forment un quadrilatère, les coins, à partir desquels les diagonales passent, sont échangés et deux nouveaux triangles sont formés. Référez-vous à la figure 1 ci-dessous.

Echange des triangles

Deux triangles adjacents ensemble forment un quadrilatère.

Référez-vous à la figure 1.

Figure 1  Triangles

L’outil Echanger triangles ou la commande Projet / Echanger triangles ne fonctionne que sur les quadrilatères convexes. Lorsque vous sélectionnez un quadrilatère concave, un message d’erreur s’affichera.

Lorsque vous échangez les triangles, la pente de hauteur se forme le long des côtés des nouveaux triangles. La ligne de courbes de niveau résultante peut être légèrement différente, et peut produire une représentation plus exacte.

Quelques fois l’échange des triangles ne produit aucune amélioration sur la surface de courbes de niveau. Par exemple, ce peut survenir si la surface de courbes de niveau est irrégulière.


Suppression d'un triangle

Utilisez l’outil Supprimer triangle  [image] sur la barre d’outils Surface ou la commande Projet / Supprimer triangle pour supprimer un triangle dans la section normale de surface de courbes de niveau.

Projet / Supprimer triangle

Utilisez cette commande pour ouvrir le dialogue Supprimer triangle. Le dialogue Supprimer triangle n’est disponible qu’à partir de la commande de menu.

Le curseur change en [image] lorsque le dialogue Supprimer triangle est actif.

Utilisez les champs dans le dialogue Supprimer triangle pour sélectionner les triangles à supprimer dans la surface.

Triangle à supprimer

Utilisez le groupe Triangle à supprimer pour identifier le triangle à supprimer.

Nord / Est

Entrez toute coordonnée dans le triangle pour identifier le triangle à supprimer.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est.

Appliquer

Cliquez sur Appliquer pour mettre à jour la surface et remettre le dialogue si vous voulez entrer un autre triangle à exclure.

Si vous voulez exclure seulement un triangle, cliquez sur OK afin de mettre à jour la surface automatiquement et fermer le dialogue.

ASTUCE: Utilisez Edition / Annuler pour restaurer les triangles supprimés.

Outil Supprimer triangle

Cliquez sur l’outil Supprimer triangle [image] sur la barre d’outils Surface pour changer la section normale de surface en supprimant les triangles.

Le curseur change en [image] lorsque l’action Supprimer triangle est active.

Sélectionnez le triangle à supprimer de l’écran de graphiques.

Triangles qui sont supprimés

Tout triangle supprimé n’est pas compris dans le MNT (Modèle numérique de terrain). Ce sert lorsque vous voulez une méthode rapide et efficace pour mettre en ordre le bord externe de la section normale de surface où les courbes de niveau sont formés de triangles longs et de forme peu réaliste.

AVERTISSEMENT: Les triangles supprimés ne se reforment pas sur une mise à jour de la surface à moins qu’une limite n’ait été ajoutée à la section normale ou une limite éditée sur la section normale.

ASTUCE: Lorsque la section normale est reconstruit après la suppression des triangles, and l’édition des lignes de limite, les triangles supprimés seront reformés comme partie de la section normale. S’il faut maintenir les triangles supprimés après la mise à jour d’une section normale, mettez des limites autour des points respectifs avant la mise à jour.


Ajouter ligne

Utilisez l’outil Ajouter ligne sur la barre d’outils Surface ou la commande Projet / Ajouter ligne pour ajouter une ligne de c/p ou une limite à la section normale de surface de courbes de niveau.

Projet / Ajouter ligne

Utilisez cette commande pour ouvrir le dialogue Ajouter ligne. Le dialogue Ajouter ligne n’est disponible qu’à partir de la commande de menu.

Utilisez le champs dans le dialogue Ajouter ligne pour ajouter une ligne de c/p ou une limite à la surface de courbes de niveau.

Type de ligne

Utilisez le groupe Type de ligne pour spécifier le type de ligne que vous voulez.

La table illustre les options:

Pour ajouter…	Sélectionnez…
Une ligne de c/p	la case à cocher du type de ligne Ligne de c/p
Une limite	la case à cocher du type de ligne Limite. Vous pouvez spécifier le type de limite en choisissant soit l’option Inclure soit l’option Exclure.
Un type de ligne de c/p et un type de ligne de limite	toutes les deux cases à cocher, et spécifiez le type de limite en choisissant l’option Inclure ou l’option Exclure. C’est à dire, vous pouvez avoir un type de ligne de ligne de c/p avec un Exclure limite ou un type de ligne de ligne de c/p avec un Inclure limite.
Début de la ligne

Utilisez le groupe Début de la ligne pour entrer le nom de point ou les coordonnées de nord et est du début de la ligne.

Nom de point

Utilisez le champ Nom de point pour identifier le point de début de la ligne. S’il est un nom de point de surface valide, les champs Nord et Est seront remplis automatiquement.

NOTE: Lorsque vous entrez un nom de point de surface non valide, un message d’erreur s’affichera:

X n’est pas un nom de point valide.

Où  X est le nom de point.

Nord / Est

Utilisez ces champs pour entrer les coordonnées du point de début lorsque vous ne connaissez pas le nom de point.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est du début de la ligne.

Fin de la ligne

Utilisez le groupe Fin de la ligne pour entrer le nom de point ou les coordonnées de no0rd et est de la fin de la ligne.

Nom de point

Utilisez le champ Nom de point pour identifier le point de fin de la ligne. S’il est un nom de point de surface valide, les champs Nord et Est seront remplis automatiquement.

NOTE: Lorsque vous entrez un nom de point de surface non valide, un message d’erreur s’affichera:

X n’est pas un nom de point valide.

Où  X est le nom de point.

Nord / Est

Utilisez ces champs pour entrer les coordonnées du point de fin lorsque vous ne connaissez pas le nom de point.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est de la fin de la ligne.

NOTE: Lorsque vous ajoutez des coordonnées qui ne correspondent pas aux coordonnées d’un point de surface valide, l’action Ajouter ligne n’est pas activée.

Ajouter

Cliquez sur Ajouter pour ajouter la ligne à la surface. Le Point de fin devient le Point de début de la ligne suivante. Ajoutez un autre point de fin afin de continuer la ligne.

ASTUCE: Si vous utilisez remplir le champ pour l’identification du point, cliquez deux fois sur le point de fin et la ligne sera ajoutée automatiquement.

AVERTISSEMENT: Si vous cliquez sur Ajouter la surface n’est pas mise à jour. Cliquez sur Mettre à jour la surface pour appliquer les lignes à la surface de courbes de niveau.

Mettre à jour la surface

Après l’ajout des lignes, l’Indicateur de mise à jour sur la barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

Pour mettre à jour la surface avant de fermer le dialogue Ajouter ligne, cliquez sur Mettre à jour la surface.

Pour mettre à jour la surface après la fermeture du dialogue Ajouter ligne, appuyez sur F4 ou utilisez la commande Projet / Mettre à jour la surface.

Points de contour

Cliquez sur Points de contour pour créer un Inclure limite qui entoure tous les points sélectionnés pour la section normale de courbes de niveau.  Cet Inclure limite en général ne retrouve pas toute la définition détaillée de limite requise, mais il fournira une définition initiale d’inclure limite. Utilisez les facilités d’Ajouter ligne et Supprimer ligne afin d’éditer cette définition initiale et de créer la définition de limite requise.

ASTUCE: Utilisez Edition / Annuler pour renverser l’action Ajouter ligne.

Outils d’Ajouter ligne

Les outils d’Ajouter ligne sur la barre d’outils Surface vous permettent d’ajouter:

  Une ligne de c/p

   Un exclure limite

  Un inclure limite

  Un inclure limite avec une ligne de c/p

  Un exclure limite avec une ligne de c/p


Suppression d'une ligne

Utilisez l’outil Supprimer ligne [image] sur la barre d’outils Surface ou la commande Projet / Supprimer ligne pour supprimer une ligne dans la section normale de surface de courbes de niveau.

Projet / Supprimer ligne

Utilisez cette commande pour ouvrir le dialogue Supprimer ligne. Le dialogue Supprimer ligne n’est disponible qu’à partir de la commande de menu.

Types de ligne à supprimer

Sélectionnez les types de ligne à supprimer de la liste.

Les types disponibles sont:

Types de ligne	Avec cette option vous pouvez …
Tout	supprimer toute ligne sélectionnée sur votre surface qui est une ligne de c/p ou une limite que vous avez sélectionné. Sous certaines circonstances une ligne peut être une limite et une ligne de c/p. Cette option est le défaut.
Lignes de c/p	supprimer seulement les lignes de c/p que vous sélectionnez
Inclure limites	supprimer seulement les Inclure limites que vous sélectionnez
Exclure limites	supprimer seulement les Exclure limites que vous sélectionnez
Inclure limites et lignes de c/p	supprimer seulement les Inclure limites et lignes de c/p que vous sélectionnez
Exclure limites et lignes de c/p	Supprimer seulement les Exclure limites et lignes de c/p que vous sélectionnez.

Début de la ligne

Utilisez le groupe Début de la ligne pour entrer le nom de point ou les coordonnées de nord et est du début de la ligne.

Nom de point

Utilisez le champ Nom de point pour identifier le point de début de la ligne. S’il est un nom de point de surface valide, les champs Nord et Est seront remplis automatiquement.

NOTE: Lorsque vous entrez un nom de point de surface non valide, un message d’erreur s’affichera:

X n’est pas un nom de point valide.

Où  X est le nom de point.

Nord / Est

Utilisez ces champs pour entrer les coordonnées du point de début lorsque vous ne connaissez pas le nom de point.

ASTUCE: Utilisez remplir le champ pour entrer les coordonnées de nord et est du début de la ligne.

Fin de la ligne

Utilisez le groupe Fin de la ligne pour entrer le nom de point ou les coordonnées de nord et est de la fin de la ligne.

Nom de point

Utilisez le champ Nom de point pour identifier le point de fin de la ligne. S’il est un nom de point de surface valide, les champs Nord et Est seront remplis automatiquement.

NOTE: Lorsque vous entrez un nom de point de surface non valide, un message d’erreur s’affichera:

X n’est pas un nom de point valide.

Où  X est le nom de point.

Nord / Est

Utilisez ces champs pour entrer les coordonnées du point de fin lorsque vous ne connaissez pas le nom de point.  Ces champs sont de lecture seule donc vous ne pouvez pas entrer des coordonnées en utilisant le clavier

ASTUCE: Sélectionnez la ligne dans la fenêtre de graphiques lorsque le dialogue Supprimer ligne est actif et le champ de point de début ainsi que le champ de point de fin sont saisis automatiquement.

Appliquer

Cliquez sur Appliquer pour supprimer la ligne.

Après la sélection de la ligne à supprimer, l’Indicateur de mise à jour sur la Barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

Pour mettre à jour la surface avant de fermer le dialogue Supprimer ligne, cliquez sur Mettre à jour la surface.

Pour mettre à jour la surface après avoir fermé le dialogue Supprimer ligne, appuyez sur F4 ou utilisez la commande Projet / Mettre à jour la surface.

Cliquez sur Fermer afin de fermer le projet.

ASTUCE: Utilisez Edition / Annuler pour renverser l’action Supprimer ligne.

Outil Supprimer ligne de c/p / Limite

Pour supprimer une ligne de c/p ou une limite en utilisant l’outil Supprimer ligne:

1. 	Cliquez sur l’outil Supprimer ligne de c/p / Limite [image] sur la barre d’outils Surface.

2. 	Cliquez sur la flèche à droite de l’outil pour accéder à la liste de types de ligne.

3. 	Sélectionnez les types de ligne que vous voulez supprimer.

L’option que vous sélectionnez de la liste agit comme un filtre et lorsque vous cliquez sur une ligne dans la fenêtre de graphiques, elle supprime la ligne si elle est une ligne d’un type de ligne spécifique. Ce sert lorsqu’il y a plus d’une ligne entre deux points et que vous voulez supprimer seulement des lignes d’un type spécifique.

AVERTISSEMENT: Le type de ligne que vous sélectionnez reste le type de ligne par défaut jusqu’à ce que vous sélectionnez un autre type de ligne ou que vous fermez le logiciel DTMLink™.

Le curseur change en [image] lorsque l’action Supprimer ligne est active.

4. 	Sélectionnez la limite ou la ligne de c/p à supprimer.

Après la suppression des lignes, l’Indicateur de mise à jour sur la Barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

5.	Pour mettre à jour la surface, appuyez sur F4, ou utilisez la commande Projet / Mettre à jour la surface.

6.	Désactivez l’outil en sélectionnant un autre outil ou appuyez sur F2.

NOTE: Une situation où vous pouvez utiliser le type de ligne Inclure limites est:

Lorsqu’un bâtiment se trouve sur la limite d’une surface, et que vous voulez éditer l’Inclure limite sans avoir un effet sur l’Exclure limite, sélectionnez le type de ligne Inclure limites de la liste et supprimez les lignes de limite appropriées dans la fenêtre de graphiques.


Mise à jour d'une surface

Après l’ajout des lignes, l’Indicateur de mise à jour sur la barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

Sélectionnez la commande Projet / Mettre à jour la surface ou appuyez sur F4 pour mettre à jour la surface et appliquer les lignes de c/p et les lignes de limite qui ont été ajoutées.

L’action de cliquer sur Mettre à jour la surface dans le dialogue Ajouter ligne également met à jour la surface.


Ajout d'un Inclure limite en utilisant l'outil Ajouter Inclure limite

1.	Sélectionnez l’outil Ajouter Inclure limite [image] de la barre d’outils Surface.

Le curseur change en [image] lorsque l’action est active.

2.	Cliquez sur le point de surface où la limite commence.

3.	Continuez d’ajouter des sections de l’Inclure limite en sélectionnant les points de surface.

Une ligne en bleu foncé s’affiche sur l’écran entre les points d’Inclure limite.

4.	Retournez au premier point pour fermer la limite. Si vous n’avez pas fermé la limite, le logiciel DTMLink™ essayera de fermer la limite lorsque vous mettez à jour la surface.

Après l’ajout des lignes, l’Indicateur de mise à jour sur la barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

5.	Pour mettre à jour la surface, effectuez l’une des choses suivantes:

Appuyez sur F4.

Utilisez la commande Projet / Mettre à jour la surface.

6.	Pour terminer l’ajout à la limite, sélectionnez un autre outil ou appuyez sur F2.

NOTE: Pour ajouter un Inclure limite et une ligne de c/p en utilisant l’outil Ajouter ligne appuyez sur la flèche à droite de l’outil Exclure limite et sélectionnez Inclure limite et ligne de c/p de la liste déroulante.


Ajout d'un Exclure limite utilisant l'outil Ajouter Exclure limite

Pour ajouter un Exclure limite en utilisant l’outil Ajouter Exclure limite:

1.	Sélectionnez l’outil Ajouter Exclure limite [image] de la barre d’outils Surface.

2.	Cliquez sur le point de surface où la limite commence.

Le curseur change en [image] lorsque l’action est active.

3.	Continuez d’ajouter des sections de l’Exclure limite en sélectionnant les points de surface.

Une ligne en bleu clair s’affiche sur l’écran entre les points d’Exclure limite.

4.  Retournez au premier point pour fermer la limite. Si vous n’avez pas fermé la limite, le logiciel DTMLink essayera de fermer la limite lorsque vous mettez à jour la surface.

Après l’ajout des lignes, l’Indicateur de mise à jour sur la barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

5.	Pour mettre à jour la surface, effectuez l’une des choses suivantes:

Appuyez sur F4.

Utilisez la commande Projet / Mettre à jour la surface.

6.	Pour terminer l’ajout à la limite, sélectionnez un autre outil ou appuyez sur F2.

NOTE: Pour ajouter un Exclure limite et une ligne de c/p en utilisant l’outil Ajouter ligne appuyez sur la flèche à droite de l’outil Exclure limite et sélectionnez Exclure limite et ligne de c/p de la liste déroulante.


Limites et Lignes de c/p : Détails techniques

Cette rubrique explique comment un Modèle Numérique de Terrain (MNT) est créé et expose à grands traits certains des effets sur la section normale produits par le traitement des lignes de c/p et des limites.

Lorsque la surface est créée, le logiciel DTMLink™ forme des triangles entre les points de surface. Les lignes (qui sont les bords de triangle) formées entre les points de surface ont une pente constante.

Les rubriques suivantes sont discutées:

  Limites

  Lignes de c/p

  Effet du traitement des lignes de c/p et des limites

Limites – Vue d’ensemble

Il y a deux types de limite: Inclure limites et Exclure limites. Un Inclure limite est une ligne définissant une superficie de la surface comprise dans la section normale. Un Exclure limite est une ligne définissant une superficie de la surface que doit être exclue de la section normale. Par exemple, si les côtés d’un bâtiment étaient définis comme un exclure limite, les lignes de courbes de niveau ne seraient pas tracées à travers le bâtiment. Les Exclure limites devraient être définis à l’intérieur des inclure limites, mais si un inclure limite est créé à l’intérieur d’un exclure limite, l’exclure limite annulera l’inclure limite.

Une limite est une figure fermée. Si une limite n’est pas fermée il y aura une tentative de la fermer lorsque la surface est mise à jour.

Lignes de c/p – Vue d’ensemble

Les lignes de c/p sont une série de lignes qui sont connues d’avoir une pente constante. Le logiciel DTMLink™ utilise la pente de chaque ligne pour ajuster la section normale du triangle. Par exemple, le haut d’un sommet ou le bord d’une route peut être défini comme une ligne de c/p afin d’empêcher le logiciel DTMLink™ de réaliser des interpolations incorrectes à travers la ligne. Naturellement, les lignes de c/p ne se croisent pas à moins qu’elles ne passent à travers un point commun où qu’elles se croisent.

Les limites ainsi que les lignes de c/p sont définies comme une série de lignes reliant des points de la base de données.

Effet du traitement des lignes de c/p et les limites

Les limites et les lignes de c/p causent la réformation des triangles dans la section normale. Les figures suivantes illustrent comment le logiciel DTMLink reforme la section normale en créant des lignes de c/p et en formant des triangles de surface.

NOTE: Partout dans cette section, les limites et les lignes de c/p sont illustrées entre les points de surface A et B. Les sommets de triangle sont numérotés lorsqu’approprié.

Exemple 1: Ligne de c/p traversant un triangle

La figure 1 représente une section normale non-typique et simplifiée d’un triangle et une ligne de c/p. Les points de changement de pente X et Y sont formés à l’intersection du triangle et de la ligne de c/p.

Figure 1 Ligne de c/p simplifiée

Les hauteurs des points X et Y sont interpolées le long de la ligne de c/p entre les points A et B. Ces points de c/p deviennent les points de surface dans la section normale et trois nouveaux triangles sont formés.

Exemple 2: Ligne de c/p traversant des triangles multiples

La figure 2 montre la représentation d’un modèle de triangle avec une ligne de c/p définie.

Figure 2 Calcul (1)

La réformation des triangles suit de façon séquentielle le cours de la ligne de c/p, avec un point d’arrêt c/p inséré à l’intersection de chaque côté de triangle avec la ligne de c/p.  Ces points d’arrêt sont montrés. Les hauteurs de chaque point d’arrêt sont interpolées le long de la ligne de c/p entre les points A et B.

A la suite ces points de c/p deviennent une partie de la section normale de surface et dix nouveaux triangles sont formés. Référez-vous aussi à la figure 3.  Le point solide indique les nouveaux triangles formés.

Figure 3 Calcul (2)

Exemple 3: Limite traversant un triangle

La figure 4 représente un modèle simplifié et non-typique d’un triangle et un limite. Les points d’arrêt  X et Y sont formés à l’intersection du triangle et la ligne de c/p. Il faut supposer que le sommet du triangle (marqué 1) est à l’intérieur de la limite et que les sommets (marqués 2 et 3) se trouvent au dehors de la limite.

Figure 4 Limite (1)

La hauteur du point X est interpolée entre les points 1 et 3. La hauteur du point Y est interpolée entre les points 1 et 2. Le triangle est formé entre  X, Y, et 1 et les points 2 et 3 sont écartés de la section normale de surface.

La figure 5 illustre une situation semblable où une limite passe à travers un triangle formé. A nouveau, il faut supposer que le point 1 est à l’intérieur de la limite.

La hauteur du point X est interpolée entre les points 1 et 3. La hauteur du point Y est interpolée entre les points 1 et 2.

Figure 5 Limite (2)

Deux  nouveaux triangles sont formés et les points 2 et 3 sont écartés de la surface et des nouveaux triangles sont formés.

Exemple 4: Limite et ligne de c/p combinées traversant un triangle

Une ligne peut avoir les caractéristiques d’une limite et une ligne de c/p. Référez-vous à la figure 6.

Figure 6 Limite et ligne de c/p

Les points d’arrêt sont créés aux point X et Y à l’intersection du triangle et la ligne de c/p.

Etant donné que la ligne A B est une ligne de c/p et une limite, les hauteurs des points d’arrêt X et Y sont interpolées le long de la ligne de c/p entre les points A et B.

A cause du fait que le sommet 1 se trouve à l’intérieur de la limite, le triangle défini par les points 1, X et Y est formé. Les points 2 et 3 sont écartés de la section normale.


Supprimer toutes lignes
Projet / Supprimer toutes lignes

Utilisez cette commande pour supprimer toutes les lignes de c/p ou les limites sur la surface.

Un message d’avertissement s’affichera.

Cette opération ne peut pas être annulée. Cliquez sur OK pour supprimer toutes les lignes de c/p et limites de cette surface.

Cliquez sur OK si vous êtes sûr que vous voulez supprimer toutes les lignes de c/p et les limites en permanence.

La surface est mise à jour lorsque vous cliquez sur OK.


Ajout d'une ligne de c/p en utilisant l'outil Ajouter ligne de c/p

Pour ajouter une ligne de c/p en utilisant l’outil Ajouter ligne de c/p:

1.	Cliquez sur l’outil Ajouter ligne de c/p [image] de la barre d’outils Surface.

Le curseur change en [image] lorsque l’action est active.

2.	Cliquez sur le point de surface où la ligne de c/p commence.

3.	Continuez d’ajouter des sections de la ligne de c/p en sélectionnant les points de surface.

Une ligne rouge est tracée sur l’écran entre les points de surface sélectionnés.

Après l’ajout des lignes, l’Indicateur de mise à jour sur la barre d’état change afin d’indiquer qu’il faut mettre à jour la surface.

4.	Pour mettre à jour la surface, effectuez l’une des choses suivantes:

Appuyez sur F4.

Utilisez la commande Projet / Mettre à jour la surface.

5.	Pour terminer l’ajout à la ligne de c/p, sélectionnez un autre outil ou appuyez sur F2.

Pour ajouter une autre ligne de c/p:

Cliquez sur l’outil Ajouter ligne de c/p et répétez les étapes 1 à 5 ci-dessus.

ASTUCE: Ajouter une ligne de c/p et une limite en utilisant le :

Outil Inclure limite

Outil Exclure limite

Sélectionnez Limite et ligne de c/p du menu déroulant.


Menu Projet

Utilisez le menu Projet pour éditer une surface. Il a les commandes suivantes:

Inclure point

Exclure point

Echanger triangles

Supprimer triangle

Ajouter ligne

Mettre à jour la surface

Supprimer ligne

Supprimer toutes lignes


Support technique

Lorsque vous avez un problème et que vous ne pouvez pas trouver les informations requises dans la documentation du produit, mettez-vous en contact avec votre fournisseur local.

Sinon, demandez de support technique chez le Site Web Trimble (http://www.trimble.com/support.html/


Marque de commerce

Trimble avec le logo Trimble est une marque de déposée de Trimble Navigation Limited enregistrée au Bureau des marques et des Brevets des Etats-Unis.

Coordinate System Manager (Gestionnaire du système de coordonnées) est une marque de commerce de Trimble Navigation Limited.

Toutes les autres marques sont la propriété de leurs détenteurs respectifs.


Garantie

Exclusion de la garantie

Sauf stipulé dans la “garantie limitée” ci-jointe, le matériel, logiciel, firmware et documentation Trimble sont fournis “tels quels” et sans garantie expresse ou limitée d’aucune sorte par Trimble Navigation Limited ou toute autre partie ayant pris part à la création, la production ou la distribution, y compris mais pas limitée aux garanties suggérées de  valeur commerciale et de capacité pour un but particulier. Le risque entier, c’est-à-dire la qualité et la performance du matériel, des logiciels, du firmware et de la documentation Trimble vous appartient. Certains états n’autorisent pas l’exclusion des garanties impliquées, donc la garantie ci-dessus peut ne pas s’appliquer dans votre cas.

Limitation de responsabilité

Dans aucun cas, Trimble Navigation Limited ou toute autre partie participant à la création, la production ou la distribution du logiciel Trimble ne sera rendu responsable pour toute plainte de dommages, y compris tout profit perdu, gains perdus ou tout autre dommage spécial, accidentel, conséquentiel ou exemplaire, incluant mais n’étant pas limité à tout dommage estimé ou payé par vous-même ou tout autre tiers, provenant de l’utilisation, de la responsabilité d’utilisation de la qualité ou de la performance des logiciels et de la documentation Trimble, même si Trimble Navigation Limited ou toute autre personne ou entité a été informée de la possibilité de dommages, ou pour toute plainte par une autre partie. Certains états n’autorisent pas la limitation ou l’exclusion de responsabilité pour des dommages accidentels ou conséquentiels, donc les limitations ci-dessus peuvent ne pas s’appliquer dans votre cas.

Garantie limitée du logiciel et du firmware

Trimble Navigation Limited garantit que les produits Logiciel et Firmware seront substantiellement conformes aux spécifications publiées à condition qu’ils soient utilisés avec les produits, les produits informatiques et le système d’exploitation Trimble pour lesquels ils ont été conçus. Trimble garantit également, pour une période de quatre-vingt dix (90) jours, trente (30) jours à compter de la date d’expédition depuis la société Trimble, que la source sur laquelle le Logiciel et le Firmware sont distribués, ainsi que la documentation, ne comportent pas de défauts dans les matériaux et la fabrication. Pendant cette période de garantie de  quatre-vingt dix (90) jours, Trimble remplacera toute source ou toute documentation défectueuse, ou fixera toute erreur de programme substantielle gratuitement. Si Trimble est incapable de remplacer les sources magnétiques ou les documentations défectueuses, ou de fixer les erreurs de programme, Trimble remplacera la somme versée pour le Logiciel. Ceux-ci constituent vos seuls recours pour la rupture la garantie.


Site World Wide Web

Pour une vue interactive de Trimble, visitez notre site sur le World Wide Web
(www.trimble.com/)


Feedback

Nous vous remercions d'avoir acheter ce produit. Nous serions très reconnaissants de recevoir votre feedback. Envoyer vos commentaires à:

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642-3642
Sunnyvale, CA 94086
Etats-Unis.

Tél: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
www.trimble.com/

Si vous avez des commentaires concernant cette documentation, veuillez nous contacter. Vos commentaires nous assisteront d'améliorer les versions ultérieures.

Pour envoyer votre feedback, envoyez vos commentaires et vos suggestions à l'adresse ci-dessus, ou envoyez un email à ReaderFeedback@trimble.com

Tout commentaire et suggestion deviennent la propriété de Trimble Navigation Limited.