Copyright: ｩ1999-2002 Trimble Navigation Limited. All rights reserved.
Citation: ｩ1999-2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office －概要

Trimble Geomatics Office は，GPS(RTK および後処理)や一般測量機(自動追尾およびロボット)、レベル、レーザー等のいろいろな測量技術のデータを統合することができます。広い範囲にわたる質コントロールツールは，現場からオフィスへ，さらに現場へ再度戻るため，継ぎ目のないデータ転送をより早く効果的にします。

Trimble Geomatics Office を使用して次の操作を行います。

GPS 基線解析(WAVE 基線解析モジュールをインストールしている場合)

測量網平均(網平均モジュールをインストールしている場合)

GPS および一般測量機による地形測量データの処理

データの品質保証および質コントロール(QA/QC)

道路設計データのインポートおよびエクスポート

測量データのインポートおよびエクスポート

デジタル地形モデル(DTM )およびコンター

測地系変換および投影

GIS データの取得およびエクスポート

特徴コード

プロジェクトレポート

測量プロジェクト管理

主な特徴

Trimble Geomatics Office (バージョン1.6)ソフトウェアの主な特徴を挙げます。

プロジェクトデータを測量画面および平面図にグラフィックに表示

よく使用する操作をショートカットとしてメインウィンドウのプロジェクトバーに配置

表示フィルターにより，観測タイプごとに表示/非表示の切替えが可能

'ドラッグ･アンド･ドロップ'機能により，デスクトップからプロジェクトへのジョブファイルのドラッグ･アンド･ドロップが可能

GPS受信機および/またはトータルステーションから観測データをインポート

広い範囲にわたるインポートおよびエクスポートファイルフォーマット

DAT チェックインダイアログにより，インポートする前にGPS 生データをチェックし編集することが可能

プロパティウィンドウにより，観測タイプのようなポイントに関連するあらゆる情報を表示し編集することが可能

マルチ編集ダイアログより，複数のデータの編集を迅速に行うことが可能

GIS データ収集をサポート

レイヤーをサポートしてCAD データを管理

専門的情報を含むHTML レポート

標準およびカスタムのレポートフォーマット

サードパーティの道路設計ファイルを表示したり編集したりするRoadLink モジュール，およびデジタル地形モデル(DTM )を作成するDTMLink モジュール

ノート：Trimble Geomatics Office は8.3 ファイル名システムをサポートしていません。

モジュール

Trimble Geomatics Office で使用できるオプションのモジュールについて説明します。

WAVE 基線解析モジュールは，静止，高速静止，キネマティックなどの方法で観測されたGPS のフィールドデータから基線を計算します。WAVE 基線解析は，標準解析と高度な解析のための設定可能なコントロールを用意しています。Timeline  は生の観測ファイルのGPS データを時刻ベースのグラフィック画面に表示します。Timeline  を使用して，生のGPS 観測や測量情報を表示したり編集したりします。

網平均モジュールは，GPS および一般測量機の測量データを平均して固有の誤差を推定したり削減したりします。

Geomatics とは?

Geomatics とは，空間情報の設計，収集，保存，解析，表示，修正のことです。空間情報の収集は，GPS や一般測量機を含むいろいろなソースから得られます。Geomatics は，従来の測量技術を新しい技術に統合する手法であり，従って多くのアプリケーションの役に立ちます。


ソフトウェアの削除

注意：このトピックで紹介する操作では共通ファイル，テンプレート，データファイルを除くすべてのファイルを削除します。データファイルの削除は，Microsoft Windows のエクスプローラで行ってください。

Trimble Geomatics Office をコンピュータから削除するには：

1.	スタート/設定/コントロールパネルを選択します。

2.	コントロールパネルからアプリケーションの追加と削除を選択します。アプリケーションの追加と削除ダイアログが表示されます。

3.	プログラムの追加と削除のタブが選択されているか確認してください。

4.	Trimble Geomatics Office を選択します。

5.	追加/削除をクリックします。ファイル削除の確認メッセージが表示されます。

6.	はいをクリックします。

ファイルが削除されます。

注意：Trimble Geomatics Office をアンインストールすると，カスタマイズしたフォーマットはすべて失われます。例えば，システムの記号ライブラリ(Symbols.sym )に追加した記号タイプや，追加したカスタムインポート/エクスポートフォーマットは失われます。

下のファイルには，カスタマイズした情報が残ります。

平面図定義ファイル(*.frm )�テキストエディタでこのファイルをカスタマイズ

レポートフォーマットファイル(Asciirpt.dat )�カスタムファイル作成時にカスタマイズ

ASCII インポート定義ファイル(Asciiimp.dat )�カスタムインポートフォーマット作成時にカスタマイズ

ASCII エクスポート定義ファイル(Asciiexp.dat )�エクスポートフォーマット作成時にカスタマイズ

システムが作成した記号ライブラリ(Symbols.sym )�このファイルに新しい記号タイプ保存時にカスタマイズ

システムが作成したラインタイプライブラリ(Linetype.ltp )�このファイルに新しいラインタイプ保存時にカスタマイズ


フォルダー構造
フォルダ構造

インストール中，Trimble Geomatics Office が必要とするすべてのファイルは下のリストのフォルダにコピーされます。

フォルダ	コピーされるもの
\Program Files\Trimble\ Trimble Geomatics Office	Trimble Geomatics Office のプログラムファイルおよびヘルプファイル
...\System	システムファイル；特徴･属性ライブラリソフトウェアファイル，記号エディタ�ユーティリティ，ラインタイプエディタ�ユーティリティ，HTML レポートテンプレートを含む
...\Template	プロジェクトテンプレートファイル
...\Utility	A1 Viewer(A1 ビューア)，Convert to RINEX�(RINEX変換)，Coordinate System Manager�(座標系マネージャ)，Data Transfer(データ転送)，DC File Editor�(DC ファイルエディタ)，Feature and Attribute Editor�(特徴･属性エディタ)，Line Type Editor(ラインタイプエディタ)，Planning（計画），Symbol Editor(記号エディタ)等のユーティリティへのショートカット
...\RoadLink -DTMLink	RoadLink およびDTMLinkのプログラムファイルおよび関連ファイル
\Program Files\Common Files\ Trimble	Trimble Geomatics Office  およびTrimble 製品で使用されるファイル
...\GeoData	座標系情報およびジオイドファイル
...\GeoDB	座標系マネージャプログラムファイル
...\Data Transfer	データ転送プログラムファイル
...\DatToRinex	RINEX 変換プログラムファイル
...\DCeditor	DC ファイルエディタプログラムファイル
...\Plan	計画プログラムファイル


Trimble について

Trimble はGPS(全地球測位システム)技術の最先端を行く開発企業です。高度なGPS関連部品を適用するだけでなく、Trimble はご利用者のご要望に完全に応えるためにGPSを無線通信やソフトウェア、そしてその他の測位技術と組み合わせて強化しています。Trimble の最先端のアプリケーションには、測量、自動車ナビゲーション、機械ガイダンス、資産管理、無線プラットホーム、テレコミュニケーションインフラストラクチャなどがあります。

Trimble 本社は米国カリフォルニア州サニーベール（645 N.Mary Avenue in Sunnyvale,CA,USA）にあります。また，世界中にオフィスを置き，お客様にサービスを提供しております。

Trimble に関する最新の情報はWorld Wide Web をご覧ください。

www.trimble.com


逆算ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､2つのﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄ間の逆算を決定します。

それを行うには､測量/逆算を選択します。

逆算ﾀﾞｲｱﾛｸﾞが表示されます。


逆算ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､2つのﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄ間の逆算を決定します。ﾀﾞｲｱﾛｸﾞを使用して､ﾚﾎﾟｰﾄを生成したり､逆算に関する簡潔な（または詳細な）情報を見たりします。

それには､以下の1つを行います。

測量/逆算を選択します。

F7を押します。

ﾉｰﾄ：逆算ﾂｰﾙは､現存するﾎﾟｲﾝﾄを伴って使用されなければなりません。その他の座標ﾎﾟｼﾞｼｮﾝ間の方位角や距離を見るには､計測ﾂｰﾙを使用します。それを行うには､測量/計測を選択します。

始点

ｷｰﾎﾞｰﾄﾞからﾎﾟｲﾝﾄ名を入力するか､ﾎﾟｲﾝﾄをｸﾘｯｸするためにﾌｨｰﾙﾄﾞ記入を使用します。

終点

ｷｰﾎﾞｰﾄﾞからﾎﾟｲﾝﾄ名を入力するか､ﾎﾟｲﾝﾄをｸﾘｯｸするためにﾌｨｰﾙﾄﾞ記入を使用します。

ﾎﾟｲﾝﾀｰを他のﾎﾟｲﾝﾄの近くに移動すると､点線が表示されます。それは､算出されるべき逆算を表示します。第二のﾎﾟｲﾝﾄをｸﾘｯｸすると､点線は実線に変わります。これは､逆算詳細が参照するﾗｲﾝを示します。

ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞの単位とﾌｫｰﾏｯﾄﾀﾌﾞで設定されている表示距離がｸﾞﾘｯﾄﾞや海面距離に設定されていて､その2つのﾎﾟｲﾝﾄが標高を持たない場合には､ｸﾞﾘｯﾄﾞ距離と方位角が表示されます。しかし､ﾌｨｰﾙﾄﾞとしての表示距離が地面距離に設定されていて､両方の逆算ﾎﾟｲﾝﾄがﾇﾙ標高を持つ場合には､（標準標高がﾇﾙと設定されていると）距離はﾇﾙと表示されます。標高情報なしで地面距離を計算することはできません。

ｸﾞﾘｯﾄﾞ方位角

このﾌｨｰﾙﾄﾞはﾎﾟｲﾝﾄ間のｸﾞﾘｯﾄﾞ方位角を示します。

ｸﾞﾘｯﾄﾞ距離

このﾌｨｰﾙﾄﾞはﾎﾟｲﾝﾄ間のｸﾞﾘｯﾄﾞ距離を示します。

ﾃﾞﾙﾀ標高

両方のﾎﾟｲﾝﾄが標高を持つ場合､ﾃﾞﾙﾀ標高が表示されます。どちらの標高もわからない場合には､ﾌｨｰﾙﾄﾞはﾇﾙを示します。

方法

逆算には2つの計算方法を利用できます。

順次的	次々と連続する逆算を算出します。

放射状	共通の開始ﾎﾟｲﾝﾄから放射状に広がる逆算の連続を算出します。

計算

選択したﾎﾟｲﾝﾄをｷｰﾎﾞｰﾄﾞを使用して入力した場合には､逆算を算出するために計算をｸﾘｯｸします。

ﾚﾎﾟｰﾄに送る

逆算算出のﾚﾎﾟｰﾄを作成するためにはﾚﾎﾟｰﾄに送るをｸﾘｯｸします。逆算に関する簡潔な（または詳細な）ﾚﾎﾟｰﾄが､逆算に対して使用された表示ｵﾌﾟｼｮﾝに従って生成されることができます。

ﾉｰﾄ：ある表示ｵﾌﾟｼｮﾝからﾚﾎﾟｰﾄが生成され､その後他の表示ﾓｰﾄﾞで再生される時､そのﾚﾎﾟｰﾄからの逆算詳細は存在するﾚﾎﾟｰﾄに付加されます。

ﾚﾎﾟｰﾄの表示

作成した逆算ﾚﾎﾟｰﾄを表示するには､ﾚﾎﾟｰﾄの表示をｸﾘｯｸします。

簡潔ﾓｰﾄﾞで逆算ﾀﾞｲｱﾛｸﾞから表示されるように､簡潔ﾚﾎﾟｰﾄが逆算詳細を表示します。

詳細ﾚﾎﾟｰﾄは､そういった座標ｼｽﾃﾑで逆算を減少するために使用されるﾊﾟﾗﾒｰﾀや計算された逆算値だけでなく､ｸﾞﾘｯﾄﾞやﾛｰｶﾙ（測地学）､ﾃﾞｶﾙﾄ(WGS-84)座標ｼｽﾃﾑの始点と終点のﾎﾟｼﾞｼｮﾝをも示します。

詳細 / 簡潔

詳細をｸﾘｯｸして､詳細ｸﾞﾙｰﾌﾟを表示します。詳細ｸﾞﾙｰﾌﾟが表示されると､ﾎﾞﾀﾝは簡潔に変わります。簡潔をｸﾘｯｸして､詳細ｸﾞﾙｰﾌﾟを隠します。

詳細

詳細ｸﾞﾙｰﾌﾟは､逆算の補足的情報を表示します。

測地前方方位角

このﾌｨｰﾙﾄﾞは､最初のﾎﾟｲﾝﾄから第二のﾎﾟｲﾝﾄへの標準切断線前方（測地）方位角を表示します。

測地後方方位角

このﾌｨｰﾙﾄﾞは､第二のﾎﾟｲﾝﾄから最初のﾎﾟｲﾝﾄへの標準切断線後方（測地）方位角を表示します。

楕円面距離

このﾌｨｰﾙﾄﾞは､ﾎﾟｲﾝﾄ間の楕円面距離を表示します。

地面距離

このﾌｨｰﾙﾄﾞは､ﾎﾟｲﾝﾄ間の地面距離を表示します。

ﾃﾞﾙﾀ高度

このﾌｨｰﾙﾄﾞは､ﾎﾟｲﾝﾄ間のﾃﾞﾙﾀ高度を表示します。


計測ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､あらゆるｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳから方位角や距離､ｴﾘｱを計測します。

それを行うには､測量/計測を選択します。

計測ﾀﾞｲｱﾛｸﾞが表示されます。.


計測ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､あらゆるｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳから方位角や距離､ｴﾘｱを計測します。

それを行うには､測量/計測を選択します。

ｽｸﾘｰﾝ上のﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄやﾎﾟｼﾞｼｮﾝ間を計測することができます。（適切なﾎﾟｼﾞｼｮﾝをｸﾘｯｸします。）

2つ以上のﾎﾟｼﾞｼｮﾝを選択すると､最初と最後のﾎﾟｼﾞｼｮﾝ間の累加距離が距離ﾌｨｰﾙﾄﾞに表示されます。方位角ﾌｨｰﾙﾄﾞは､最後の2つの選択ﾎﾟｼﾞｼｮﾝ間の方位角を表示します。

ﾋﾝﾄ:ﾏｳｽをｸﾘｯｸしてﾄﾞﾗｯｸﾞすると､ﾌｨｰﾙﾄﾞは現在の方位角と､最初の選択ﾎﾟｲﾝﾄからの累加距離､囲まれたｴﾘｱを示します。

方位角

2つのﾎﾟｼﾞｼｮﾝを選択すると､ﾎﾟｲﾝﾄ間のｸﾞﾘｯﾄﾞ方位角が表示されます。3つ以上のﾎﾟｲﾝﾄが選択されていると､このﾌｨｰﾙﾄﾞは最後の2ﾎﾟｲﾝﾄ間の方位角を表示します。

距離

2つのﾎﾟｼﾞｼｮﾝを選択すると､2ﾎﾟｲﾝﾄ間の距離が表示されます。3つ以上のﾎﾟｲﾝﾄが選択されていると､このﾌｨｰﾙﾄﾞは計測された距離の累加合計（和）を表示します。

表示設定に従って合計距離が報告されます。

ﾉｰﾄ：ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞの｢ﾌｨｰﾙﾄﾞとして方位角を表示｣が地面距離に設定されており､かつ計測されたﾎﾟｼﾞｼｮﾝが両方ともﾇﾙ標高を持つ場合には､（標準標高がﾇﾙと設定されていると）距離はﾇﾙと表示されます。標高情報なしでは､ｿﾌﾄｳｪｱは地面距離を算出することはできません。

ｴﾘｱ

3つ以上のﾎﾟｲﾝﾄが選択されていると､最初のﾎﾟｲﾝﾄに戻ることで形成される多角形のｴﾘｱが表示されます。

算出されるｴﾘｱは､距離表示設定によって変化します。

地面距離設定は､平均地面標高で算出されたｴﾘｱを提供します。

海面距離は､楕円面で算出されたｴﾘｱを提供します。

ｸﾞﾘｯﾄﾞ距離は､ｸﾞﾘｯﾄﾞ座標から算出されたｴﾘｱを提供します。

ﾘｾｯﾄ

ﾘｾｯﾄをｸﾘｯｸして､すべてのﾌｨｰﾙﾄﾞを空白にします。開始ﾎﾟｲﾝﾄをﾀﾞﾌﾞﾙｸﾘｯｸしてもﾘｾｯﾄを行うことができます。

ﾋﾝﾄ:ｽﾃｰﾀｽﾊﾞｰのｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳ寸法ｲﾝｼﾞｹｰﾀ [image] を見ることで､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに表示されるﾌﾟﾛｼﾞｪｸﾄ範囲を素早く決定することができます。ｲﾝｼﾞｹｰﾀを見るには､､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳの外側でｶｰｿﾙを保持します。

ﾎﾟｲﾝﾀｰ [image] を使用する時には､Ctrlを押します。これは､近くのﾎﾟｲﾝﾄに飛び移るのを防ぎます。


座標変換-概要
座標変換 － 概要

詳細

利用方法	ﾀﾞｲｱﾛｸﾞ	関連項目
概要

座標変換は､ﾌﾟﾛｼﾞｪｸﾄ内のﾎﾟｲﾝﾄを移動します。それには､移動や回転､2つの寸法での縮尺が関係します。ｺﾝﾄﾛｰﾙや調整の特質を持つﾎﾟｲﾝﾄは移動されません。移動するように選択したﾎﾟｲﾝﾄがｺﾝﾄﾛｰﾙや調整の特質を持つ場合､ﾒｯｾｰｼﾞが表示されます。

仮定された座標ｼｽﾃﾑに､ｻｰﾄﾞﾊﾟｰﾃｨｰ設計ﾊﾟｯｹｰｼﾞからのﾌﾟﾛｼﾞｪｸﾄ内のﾎﾟｲﾝﾄがあり､使用する正しい座標を得るためにそのﾎﾟｲﾝﾄを変換する必要がある場合などに､座標変換を使用します。

座標変換を定義するには､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､ﾎﾟｲﾝﾄをｸﾘｯｸしてから､その既知座標値を入力します。3つ以上のﾎﾟｲﾝﾄが使用されていると､ｿﾌﾄｳｪｱは選択されたﾎﾟｲﾝﾄに対して変換ﾊﾟﾗﾒｰﾀを計算するために最小自乗法を使用します。

変換ﾊﾟﾗﾒｰﾀを特定します。

座標変換を行う時､そのﾎﾟｲﾝﾄに対するその他のすべての観測は抑止されます。変換されたﾎﾟｲﾝﾄに対して表示されたｸﾞﾘｯﾄﾞ､ﾛｰｶﾙ､WGS-84座標は変化しましたが､座標ｼｽﾃﾑはそのままです。

変換を行った後､元来の座標値と変換された座標値を示すﾚﾎﾟｰﾄを作成することができます。


座標変換ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､水平変換を決定し適用します。

それを行うには､測量/座標変換を選択します。

座標変換が表示されます。


座標変換ﾀﾞｲｱﾛｸﾞ

概要と詳細情報

このﾀﾞｲｱﾛｸﾞを使用して､水平変換を決定し適用します。

それを行うには､測量/座標変換を選択します。

このﾀﾞｲｱﾛｸﾞ内の値を入力するには､以下の1つを行います。

ﾎﾟｲﾝﾄ一覧をｸﾘｯｸして､既知座標を持つﾌﾟﾛｼﾞｪｸﾄ内のﾎﾟｲﾝﾄを選択し､各ﾎﾟｲﾝﾄに対して既知の値を入力します。ｿﾌﾄｳｪｱは変換ﾊﾟﾗﾒｰﾀを計算します。3つ以上のﾎﾟｲﾝﾄ値がある場合には､それは最小二乗法を使用します。統計は､一覧に正しくﾎﾟｲﾝﾄを追加したかを判定する手助けとなるﾎﾟｲﾝﾄ一覧内に表示されます。座標変換ﾀﾞｲｱﾛｸﾞは､変換値を表示します。

ｷｰﾎﾞｰﾄﾞから値を入力します。

座標変換を行う時､そのﾎﾟｲﾝﾄへのその他のすべての観測は抑止されます。変換されたﾎﾟｲﾝﾄに対して表示されるｸﾞﾘｯﾄﾞ､ﾛｰｶﾙ､WGS-84座標は変化しましたが､座標ｼｽﾃﾑは変化しません。

東距偏差

東距（ﾌﾟﾗｽ）や西距（ﾏｲﾅｽ）の偏差値を表示します。

北距偏差

北距（ﾌﾟﾗｽ）や南距（ﾏｲﾅｽ）の偏差値を表示します。

回転

変換に適用されるべき回転の角度を表示します。

縮尺

変換の縮尺変化を表示します。

回転の原点

以下のﾌｨｰﾙﾄﾞが､回転の中心のﾎﾟｼﾞｼｮﾝを表示します。

ﾎﾟｲﾝﾄ	回転の原点として使用されるﾎﾟｲﾝﾄの名前を表示します。ﾎﾟｲﾝﾄ名を入力すると､北と東のﾌｨｰﾙﾄﾞに座標が表示されます。ﾊﾟﾗﾒｰﾀを算出するためにﾎﾟｲﾝﾄ一覧が使用する場合には､このﾌｨｰﾙﾄﾞはﾎﾟｲﾝﾄﾘｽﾄから座標の平均を表示します。
北	原点の北座標を表示します。
東	原点の東座標を表示します。
変換

ﾎﾟｲﾝﾄを変換するには､以下のｵﾌﾟｼｮﾝの1つを選択します。

選択	選択したﾎﾟｲﾝﾄに変換を適用します。
ﾃﾞｰﾀﾍﾞｰｽ全体	すべてのﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄに変換を適用します。
ﾎﾟｲﾝﾄが選択されていない時には､こういったｵﾌﾟｼｮﾝは利用できず､すべてのﾎﾟｲﾝﾄが変換されます。

座標変換ﾚﾎﾟｰﾄの生成

このﾁｪｯｸﾎﾞｯｸｽをｵﾝにして､元来の座標と変換された座標のﾚﾎﾟｰﾄを作成します。標準HTMLﾋﾞｭｰｱにﾚﾎﾟｰﾄが表示されます。

ﾎﾟｲﾝﾄ一覧

ﾎﾟｲﾝﾄ一覧をｸﾘｯｸして､ｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄを選択します。ﾎﾟｲﾝﾄに対する既知の値を入力します。

ﾎﾟｲﾝﾄ一覧ﾀﾞｲｱﾛｸﾞが表示されます。


座標変換 － ﾎﾟｲﾝﾄ一覧ﾀﾞｲｱﾛｸﾞ

概要と詳細情報

座標変換　－　ﾎﾟｲﾝﾄ一覧ﾀﾞｲｱﾛｸﾞを使用して､変換ﾊﾟﾗﾒｰﾀを計算するために使用されるﾎﾟｲﾝﾄを選択します。ﾎﾟｲﾝﾄを選択すると､Trimble Geomatics Office が現在の座標を表示するので､既知の座標を入力します。Trimble Geomatics Office は､変換ﾊﾟﾗﾒｰﾀを計算してから､変換するように選択されたﾎﾟｲﾝﾄに変換を適用します。

それを行うには､

1.	測量/座標変換を選択します。座標変換ﾀﾞｲｱﾛｸﾞが表示されます。

2.	ﾎﾟｲﾝﾄ一覧をｸﾘｯｸします。

このﾀﾞｲｱﾛｸﾞは､ﾎﾟｲﾝﾄのｽｸﾛｰﾙ一覧を象徴します。各ﾎﾟｲﾝﾄは､現在の座標を表示するﾌｨｰﾙﾄﾞと､既知座標を表示するﾌｨｰﾙﾄﾞを持ちます。ﾎﾟｲﾝﾄ名を入力すると､｢現在の北距｣と｢現在の東距｣ﾌｨｰﾙﾄﾞが表示されます。そして､｢既知の北距｣と｢既知の東距｣ﾌｨｰﾙﾄﾞに既知の座標を入力します。

ﾋﾝﾄ:ﾎﾟｲﾝﾄ名を空白のまま残し､現在の座標を入力するためにﾌｨｰﾙﾄﾞ記入を使用することができます。

座標変換を算出するために定義することができるﾎﾟｼﾞｼｮﾝ定義の数に制限はありません。多くのﾎﾟｼﾞｼｮﾝ定義を追加しても､算出される変換結果をいつも改善できるわけではありませんが､算出されたﾊﾟﾗﾒｰﾀの有効性に対して追加のﾁｪｯｸをしてくれます。

統計

統計ｸﾞﾙｰﾌﾟは､縮尺係数と最大垂直残差を表示します。こういった統計を使用して､不正な値が入力されたかどうかをﾁｪｯｸします。

挿入

挿入をｸﾘｯｸして､空のﾎﾟｼﾞｼｮﾝ定義ﾚｺｰﾄﾞを挿入します。一般的にはTrimble Geomatics Office は自動的に新しいﾎﾟｼﾞｼｮﾝ定義ﾌｨｰﾙﾄﾞを追加するので､これをしなければならないことはあまりありません。しかし､ﾎﾟｲﾝﾄ一覧の最初のﾎﾟｲﾝﾄが算出された変換ﾊﾟﾗﾒｰﾀの回転の原点として使用されるので､一覧の始めにﾎﾟｼﾞｼｮﾝ定義を挿入したいことがあるかもしれません。

削除

削除をｸﾘｯｸして､一覧からﾎﾟｼﾞｼｮﾝ定義を除去します。


標高調整-概要
標高調整 － 概要

詳細

利用方法	ﾀﾞｲｱﾛｸﾞ	関連項目
標高調整は､ﾎﾟｲﾝﾄの標高を調整します。

調整が行われると､Trimble Geomatics Office は以下の方法の1つを使用して標高調整を適用します。

現存するﾎﾟｲﾝﾄに対する既知の標高を入力すると､Trimble Geomatics Office は標高調整ﾊﾟﾗﾒｰﾀを計算します。

定数（ﾌﾟﾗｽかﾏｲﾅｽ）を入力すると､Trimble Geomatics Office はそれを選択されたﾎﾟｲﾝﾄすべてに適用します。

ﾉｰﾄ：ﾎﾟｲﾝﾄの高度か標高特質がｺﾝﾄﾛｰﾙか調整である場合には､標高調整は適用されません。

標高調整結果

標高調整を行う時､あるﾎﾟｲﾝﾄへのその他の観測すべてやそのﾎﾟｲﾝﾄに対するｸﾞﾘｯﾄﾞﾎﾟｼﾞｼｮﾝは抑止されます。変換されたﾎﾟｲﾝﾄに対して表示されるｸﾞﾘｯﾄﾞ､ﾛｰｶﾙ､WGS-84座標は変化しました。座標ｼｽﾃﾑは変化しません。

以下の表は､標高の数がﾎﾟｲﾝﾄ一覧に含まれる時に計算されるﾊﾟﾗﾒｰﾀを示します。

ﾉｰﾄ：算出された標高調整は､座標ｼｽﾃﾑ定義には含まれません。（測量/GPS位置ｷｬﾘﾌﾞﾚｰｼｮﾝｺﾏﾝﾄﾞで実行可能な水平調整とは異なります。）

元来の標高と､調整された標高､そしてその差異を示すﾚﾎﾟｰﾄを作成することができます。


標高調整ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､標高調整を決定し適用します。

それを行うには､測量/標高調整を選択します。

標高調整ﾀﾞｲｱﾛｸﾞが表示されます。


標高調整ﾀﾞｲｱﾛｸﾞ

概要と詳細情報

このﾀﾞｲｱﾛｸﾞを使用して､標高調整を決定し適用します。

それにｱｸｾｽするには､

測量/標高調整を選択します。

選択されたﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄの標高を調整するには､以下の方法の1つを使用します。

定数法

平面ﾊﾟﾗﾒｰﾀ法（値を入力するかﾎﾟｲﾝﾄを選択します。）

定数

このｵﾌﾟｼｮﾝを選択して､ﾎﾟｲﾝﾄの標高に定数値を追加します。選択したﾎﾟｲﾝﾄかﾌﾟﾛｼﾞｪｸﾄ全体に定数を適用します。

標高に追加

標高に追加ﾌｨｰﾙﾄﾞは､定数ｵﾌﾟｼｮﾝを選択する時に利用できるようになります。ﾎﾟｲﾝﾄに追加するためにﾌﾟﾗｽかﾏｲﾅｽの標高値を入力します。

ﾊﾟﾗﾒｰﾀ

このｵﾌﾟｼｮﾝを選択して､傾斜面標高調整に対するﾊﾟﾗﾒｰﾀを特定したり計算したりします。ﾊﾟﾗﾒｰﾀを計算するためのｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄを選択するには､ﾎﾟｲﾝﾄ一覧をｸﾘｯｸします。

原点

傾斜面の原点として使用されるﾎﾟｲﾝﾄの名前を表示します。

ﾉｰﾄ：ﾊﾟﾗﾒｰﾀの算出に対するﾎﾟｲﾝﾄを選択するためにﾎﾟｲﾝﾄ一覧が使用される場合､このﾌｨｰﾙﾄﾞは選択された最初のｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄを表示します。

原点東距

原点の東座標を表示します。原点ﾌｨｰﾙﾄﾞからﾎﾟｲﾝﾄを選択すると､このﾌｨｰﾙﾄﾞは選択されたﾎﾟｲﾝﾄの座標で記入されます。

原点北距

原点の北座標を表示します。原点ﾌｨｰﾙﾄﾞからﾎﾟｲﾝﾄを選択すると､このﾌｨｰﾙﾄﾞは選択されたﾎﾟｲﾝﾄの座標で記入されます。

補正定数

原点ﾎﾟｼﾞｼｮﾝで適用される標高補正を表示します。

北勾配

この値は､南北方向の平面の勾配を定義します。標高調整は､このPPM値と原点からの距離（南北方向）から計算されます。それは補正定数に加えて適用されます。

東勾配

この値は､東西方向の平面の勾配を定義します。標高調整は､このPPM値と原点からの距離（東西方向）から計算されます。それは補正定数に加えて適用されます。

ﾎﾟｲﾝﾄ一覧

ﾎﾟｲﾝﾄ一覧をｸﾘｯｸして､標高調整ﾊﾟﾗﾒｰﾀを算出するために使用されるｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄを選択します。ﾎﾟｲﾝﾄ一覧ﾀﾞｲｱﾛｸﾞが表示されます。

調整

このｵﾌﾟｼｮﾝを選択して調整を適用します。2つのｵﾌﾟｼｮﾝを利用できます。

選択	このｵﾌﾟｼｮﾝを選択して選択したﾎﾟｲﾝﾄに調整を適用します。
ﾃﾞｰﾀﾍﾞｰｽ全体	このｵﾌﾟｼｮﾝを選択してﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄすべてに調整を適用します。
ﾎﾟｲﾝﾄが選択されていない時には､選択ﾎﾞﾀﾝは利用できず､ﾌﾟﾛｼﾞｪｸﾄ内のすべてのﾎﾟｲﾝﾄに調整が適用されます。

標高調整ﾚﾎﾟｰﾄの生成

このﾁｪｯｸﾎﾞｯｸｽをｵﾝにして､元来の標高と変換された標高のﾚﾎﾟｰﾄを作成します。標準HTMLﾋﾞｭｰｱにﾚﾎﾟｰﾄが表示されます。


標高調整 － ﾎﾟｲﾝﾄ一覧ﾀﾞｲｱﾛｸﾞ

概要と詳細情報

Trimble Geomatics Office は､標高調整ﾊﾟﾗﾒｰﾀを計算するために､このﾀﾞｲｱﾛｸﾞで選択されたﾎﾟｲﾝﾄを使用します。ﾌﾟﾛｼﾞｪｸﾄでﾎﾟｲﾝﾄを選択し､それに対する既知の標高を入力します。

それを行うには､

1.	測量/標高調整を選択します。標高調整ﾀﾞｲｱﾛｸﾞが表示されます。

2.	ﾎﾟｲﾝﾄ一覧をｸﾘｯｸします。

ﾌｨｰﾙﾄﾞ記入かｷｰﾎﾞｰﾄﾞ入力を使用して各ｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄを選択し､既知標高を入力します。

ﾋﾝﾄ:座標と標高ﾌｨｰﾙﾄﾞは､ｽｸﾘｰﾝから適切なﾎﾟｲﾝﾄを選ぶためにﾌｨｰﾙﾄﾞ記入を使用して記入することができます。

通常3つ以上のｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄを入力します。こういったﾎﾟｲﾝﾄは､調整されるﾎﾟｲﾝﾄ周辺に平均的に分布されるべきです。

標高調整を算出するために定義することができるﾎﾟｲﾝﾄの数に制限はありません。多くのﾎﾟｲﾝﾄ定義を追加したからといって､算出される変換結果を改善できるわけではありませんが､算出されたﾊﾟﾗﾒｰﾀに対して追加のﾁｪｯｸをしてくれます。

統計

統計ｸﾞﾙｰﾌﾟは､最大調整傾斜角と最大垂直残差を表示します。こういった統計を使用して､不正な値が入力されたかどうかをﾁｪｯｸします。

挿入

挿入をｸﾘｯｸして､1つのﾎﾟｼﾞｼｮﾝ定義ﾚｺｰﾄﾞを挿入します。一般的にはTrimble Geomatics Office は自動的に新しいﾎﾟｼﾞｼｮﾝ定義ﾌｨｰﾙﾄﾞを追加するので､このﾎﾞﾀﾝを使用しなければならないことはあまりありません。しかし､ﾎﾟｲﾝﾄ一覧の最初のﾎﾟｲﾝﾄが標高調整の原点として使用されるので､希望するﾎﾟｲﾝﾄ一覧の始めにそのﾎﾟｲﾝﾄを置くためにこの機能を使用することができます。しかし､調整原点として使用されるﾎﾟｼﾞｼｮﾝは通常重要ではありません。

削除

削除をｸﾘｯｸして､一覧からあるﾎﾟｼﾞｼｮﾝ定義を除去します。


元に戻すコマンド

操作を取り消すためにこのコマンドを使用します｡

この機能を使用するには以下の1つを行います。

編集/元に戻すを選択します。

CtrlとZを一緒に押します。

編集メニューでは元に戻すコマンドの横に現れるテキストが、元に戻される操作を示します。操作は1つづつ元に戻されます。最後の操作が最初に元に戻されます。間違えて操作を元に戻した場合には、やり直しコマンドを使用します｡

プロジェクトかTrimble Geomatics Office を1度閉じると、開いている間に行われたどの操作も元に戻すことはできません。

ヒント：プロジェクトを閉じた後でインポート作業を元に戻すには、ポイントの選択ダイアログ/全般タブの検索ソースオプションを使用し、インポート作業を元に戻すために選択を削除します。


やり直しコマンド

編集/やり直しコマンドを使用して、元に戻した操作をやり直します｡

この機能を使用するには以下の1つを行います。

編集/やり直しを選択します。

CtrlとYを一緒に押します。

編集メニューではやり直しコマンドの横に現れるテキストが、やり直される操作を示します。

プロジェクトを1度閉じると、開いている間に行われたどの操作もやり直すことはできません。


切り取り、コピー、貼り付けコマンド

切り取り、コピー、貼り付けコマンドは、現在選択されているデータを移動したりコピーしたりするのに便利な方法です。

編集メニューから、切り取り、コピー、貼り付けを選択します。

切り取りは、現在のプロジェクトから選択部を除去します。

コピーは、選択部の複製を作成します。

貼り付けは、選択部を別のプロジェクトかソフトウェアアプリケーションに挿入します。

選択部を切り取ったりコピーしたりする場合、それはクリップボード上に置かれます。新たに切り取りやコピーを行うと、それは以前の選択部と置き換えられます。

選択部のコピーは、選択部を別のプロジェクトかソフトウェアアプリケーションに貼り付けた後もクリップボードに残ります。その選択部をもう1度、または必要に応じて何度でも貼り付けることができます。

以下を行うためにこれらのコマンドを使用します｡

プロジェクト間のデータの移送（例えば、プロジェクト間で基準点をコピーできます）

あるプロジェクトから別のプロジェクトへの属性を持つポイントのコピーと貼り付け

レポートへのCAD作業のコピーと貼り付け

異なる座標系を持つプロジェクトへのデータのコピー（例えば、NAD-27座標系を持つプロジェクトからのポイントは、NAD-83座標系を持つプロジェクトへとコピーして貼り付けられることができます）

コピーされたエンティティは、それに関係する座標値を使用してプロジェクトに貼り付けられます。エンティティを貼り付けようとしているプロジェクトがエンティティのコピー元のプロジェクトとは異なる座標系定義を持つ場合、座標値は新しい座標系に自動的に変換されるので、エンティティは正しい位置に配置されます。

ノート：あるプロジェクトから別のプロジェクトに観測をコピーして貼り付けるには、Trimble Data Exchangeフォーマットを使用しなければなりません。Trimble Geomatics Office ではプロジェクト間での観測のコピーと貼り付けはできません。


削除コマンド

現在選択されたエンティティを削除するためにこのコマンドを使用します｡

この機能を使用するには以下の1つを行います。:

編集/削除を選択します。

削除を押します。

削除コマンドを元に戻すには、

編集/元に戻すを選択します。


ポイント名変更コマンド

ポイント名を変更するためにこのコマンドを使用します｡

この機能を使用するには編集/ポイント名変更を選択します。

名前変更ダイアログが表示されます。


名前変更ダイアログ

概要と詳細

1つのプロジェクト内に物理的に同一ではないけれども同じ名前を持つポイントがたくさんある場合に、名前変更ダイアログを使用して名前を変更し、重複ポイントを取り除くことができます。

例

別々のフィールドスタッフによって収集された2つのSurvey Controllerファイルをインポートするとします。

1人のフィールドスタッフは1000から2000のポイント名を使用します。

もう1人のフィールドスタッフは1000から1050のポイント名を使用します。

重複ポイントオプションダイアログで許容値内の重複ポイントを結合オプションが設定されている間にファイルがインポートされると、データベースには51の重複ポイント（1000 から1050 ）が作成されます。

重複ポイントオプションダイアログで重複ポイントを常に結合オプションが設定されている間にファイルがインポートされると、ソフトウェアはどの重複ポイントを結合したかを知らせてくれます。重複ポイントの名前を変更したい場合には、インポートオプションを元に戻してから名前を変更します。

これを行うには

編集/ポイント名変更を選択します。名前変更ダイアログが現れます。

名前変更

ポイント名を変更するには、以下のオプションの1つを選択します。

選択　－　このオプションは選択されたポイントの名前を変更します。

データベース全体　－　このオプションはすべてのポイントの名前を変更します。

ポイントが選択されていない時には、標準でデータベース内のすべてのポイントの名前が変更されます。

ヒント：.dcファイルからの座標名を変更するには、ソースからポイントを選択するためにポイントの選択ダイアログを使用します。

方法

方法には以下のオプションがあります。

変更する名前

変更する名前をクリックして、変更したい最初の名前を入力します。

ノート:アルファベットを使用した名前を入力すると、選択部内のすべてのポイントに同じ名前が与えられます。選択が行われた時に、ポイント名に変化を持たせるためには、名前の最後の文字に数値を入力します。

接頭文字追加

接頭文字追加をクリックして、接頭文字を入力します。例えば、地形(Topo )ポイントを示すためには、選択した現存するポイント名に接頭文字TOPO を入力します。

ヒント：接頭文字の最後の文字をスペースにします。これは元のポイントと名前の変更されたポイントを区別します。

接尾文字追加

接尾文字追加をクリックして、接尾文字を入力します。例えば、測量日を示すために（08/10/99のように）日付接尾文字を追加します。

ヒント:接尾文字の最初の文字をスペースにします。これは元のポイントと名前の変更されたポイントを区別します。

定数追加

このオプションを使用して、選択されたポイントに定数を追加します。定数値はプラスのこともマイナスのこともあります。以下の表がその例を示します。

ノート：P1023 �1000 はP23 になります。P0023 に変更したい場合、第2の名前変更操作が行われる場合には、P23 +0000を実行することができます。

レポート

このチェックボックスをオンにすると、元の名前と新しい名前のレポートを作成できます。OKをクリックすると、標準HTMLビューアにレポートが表示されます。


プロパティコマンド

プロパティウィンドウを開くにはこのコマンドを使用します。

この機能を使用するには、編集/プロパティを選択します。

プロパティウィンドウが開きます。


CADスタイルー概要
CADスタイル‐概要

詳細

関連項目	ダイアログ
概要

計画表示では、CADスタイルはTrimble Geomatics Officeグラフィックスウィンドウでのエンティティ（ポイントやライン、テキスト）の表示方法を設定します。

CADスタイルには以下のものが含まれます。

ポイントスタイル

ラインスタイル

テキストスタイル

ポイントスタイルとラインスタイル

ポイントスタイルとラインスタイルは、ポイントとラインの表示方法を設定します。

ポイントスタイルは、ポイント記号とその記号のサイズや色、寸法の設定から構成されます。ポイント記号を作成したり編集したりするには、記号エディタユーティリティを使用します。

ラインスタイルは、ラインタイプとそのタイプのサイズや色、寸法の設定から構成されます。ラインタイプを作成したり編集したりするには、ラインタイプエディタユーティリティを使用します。

ポイントやラインのスタイルを設定するには、以下の1つを使用します。

プロパティウィンドウ

特徴コード処理

ポイントスタイルを作成したり編集したりするには、Trimble Geomatics Office のCADスタイルダイアログか、または特徴・属性エディタユーティリティを使用します。

トリンブルの標準テンプレートは、記号ファイル(*.sym)とラインタイプファイル(*.ltp)の各記号とラインタイプに対して、ポイントスタイルとラインスタイルを持っています。スタイルは、記号やラインタイプと同じ名前を持ちます。

ポイントかラインがレイヤーでと設定されたポイントスタイルフィールドかラインスタイルフィールドを持つ場合には、ポイントスタイルやラインスタイルはレイヤーから受け継いだポイントやラインに割り当てられます。標準スタイルは、ポイントやラインが存在するレイヤーに対して設定されます。

異なるレイヤーに標準スタイルを設定するには、レイヤーダイアログを使用します。

テキストスタイル

テキストスタイルは、Trimble Geomatics Officeソフトウェアでのテキストエンティティの表示方法を設定します。プロパティウィンドウを使用して、テキストエンティティに対するテキストスタイルを設定します。テキストスタイルは、フォントやサイズ情報、フォントフォーマットから構成されます。トリンブル社は、標準と名付けられたテキストスタイルを提供しますが、自分で独自のスタイルを作成することができます。それを行うには、Trimble Geomatics Office のCADスタイルダイアログを使用します。


スタイルコマンド

ポイントスタイル、ラインスタイル、テキストスタイルを作成し管理するために、このコマンドを使用します｡

この機能を使用するには以下の1つを行います。:

編集/スタイルを選択します。

CtlとSを一緒に押します。

CADスタイルダイアログが表示されます。


CADスタイルダイアログ

概要と詳細

ポイント、ライン、テキストスタイルを作成して管理するためにCADスタイルダイアログを使用します。

それにアクセスするには、

編集/スタイルを選択します。

新規

スタイル作成ダイアログを開いて、現在のタブを基礎とする新しいスタイルを作成します。

編集

編集をクリックして、現存するスタイルを編集します。プロジェクト内のエンティティによって使用されているCADスタイルを編集する場合、エンティティは新しいCADスタイル設定と一緒に更新されます。

削除

削除をクリックしてスタイルを削除します。プロジェクト内のエンティティによって使用されていないCADスタイルならどれでも削除することができます。


ポイントスタイルを作成-編集 ダイアログ
ポイントスタイル作成/編集ダイアログ

このダイアログを使用して、ポイントスタイルを作成したり編集したりします。

この機能を使用するには、

1.	計画表示から、編集/スタイルを選択します。CADスタイルダイアログが表示されます。

2.	ポイントスタイルタブで、以下の1つを行います。

新規をクリックすると、ポイントスタイル作成ダイアログが表示されます。

編集をクリックすると、ポイントスタイル編集ダイアログが表示されます。

スタイルを選択すると、編集ボタンを利用できます。

名前

新しいポイントスタイルの名前を入力するか、現存するポイントスタイルの名前を変更します。ポイントスタイル名のすべてはユニークでなければなりません。しかし、ポイントスタイル、ラインスタイル、テキストスタイル間には同じ名前を使用することができます。

記号

記号一覧から記号を選択します。記号を表示したり編集したりするには、記号エディタユーティリティを使用します。

色

記号に対する色を選択します。ウィンドウテキストを選択する場合には、スタイルはMicrosoft Windowsのウィンドウテキスト設定を使用して表示されます。ウィンドウテキスト設定を編集するには、コントロールパネルを使用します。ウィンドウテキストが使用される時に、標準スタイルが選択されている場合には、そのスタイルはプロット中には黒を標準とします。標準スタイルを選択するには、表示/オプション/画面デザインタブを選びます。黒のスタイルを選択した場合にはそのスタイルはプロット中には白を標準とします。

記号定義によっては、定義された色を持つものもあります。こういった色は、記号がTrimble 記号エディタユーティリティで作成された時に設定されます。例えば、Trimble 記号エディタユーティリティを使用して、記号低木林の色を緑と定義することができます。色定義を持つ記号を選択する場合には、色フィールドは利用できなくなり、色フィールドには記号からと表示されます。

直径

記号の直径を入力します。直径フィールドの単位は、寸法オプションが紙に設定されているか地面に設定されているかによって決まります。直径を適用しない記号（1ピクセルのドット(点)など）の場合には、このフィールドは利用できません。

紙	オプションが選択された場合、記号の直径の値は紙上の記号のサイズを制御します。

例えば寸法オプションが紙に設定されている時に直径フィールドに5を入力すると、Trimble Geomatics Office はメートル法の図面に5ミリの記号を描きます。
Trimble Geomatics Office が使用する単位は、座標単位です。座標単位を設定するには、ファイル/プロジェクトプロパティ/単位とフォーマットタブを選択します。

スクリーン上の紙の単位の描写は、図面の縮尺を使用して計算されます。図面の縮尺を設定するには、ファイル/ページ設定ダイアログを選択します。

地面	オプションが選択された場合、記号の直径値は地面上のサイズです。

例えば寸法オプションが地面に設定されている時に直径フィールドに5を入力すると、Trimble Geomatics Office は5メートルの大きさの記号（または5フィートの大きさの記号、座標単位設定に依存します）を描きます。これはプロット上とスクリーン上の両方で起こります。
座標単位を設定するには、ファイル/プロジェクトプロパティ/単位とフォーマットタブを選択します。

回転

回転フィールドを使用して、記号の向きを制御します。このフィールドの解釈は、寸法オプションの設定に左右されます。

紙	紙オプションが選択された場合記号は、描写されるページの一番上に相関的な向きで常に描写されます。

地面	地面オプションが選択された場合、記号は北に相関的に描写されます。

寸法

紙か地面をクリックして、上に説明したように直径と回転のフィールドの操作を制御します。


ラインスタイルを作成/編集ダイアログ

このダイアログを使用して、ラインスタイルを作成したり編集したりします。

この機能を使用するには、

1.	計画表示から、編集/スタイルを選択します。CADスタイルダイアログが表示されます。

2.	ラインスタイルタブで、以下の1つを行います。

新規をクリックすると、ラインスタイル作成ダイアログが表示されます。

編集をクリックすると、ラインスタイル編集ダイアログが表示されます。

（スタイルを選択すると、編集ボタンが利用できるようになります）

名前

新しいラインスタイルの名前を入力するか、現存するラインスタイルの名前を変更します。ラインスタイル名のすべてはユニークでなければなりません。しかし、ポイントスタイル、ラインスタイル、テキストスタイル間には同じ名前を使用することができます。

設定

スタイルの表示を定義するために設定グループを使用します。

ラインタイプ

ラインに対するラインタイプを選択します。ラインタイプを表示したり編集したりするには、Trimble ラインタイプエディタユーティリティを使用します。

色

ラインスタイルに対する色を選択します。ウィンドウテキストを選択する場合には、スタイルはMicrosoft Windowsのウィンドウテキスト設定を使用して表示されます。Windows設定を編集するには、Microsoft Windowsのコントロールパネルを使用します。ウィンドウテキストが使用される時に、標準スタイルが選択される場合には、そのスタイルはプロット中には黒を標準とします。標準スタイルを選択するには表示/オプション/画面デザインタブを選びます。黒のスタイルを選択した場合にはそのスタイルはプロット中には白を標準とします。

ラインタイプ定義によっては、定義された色を持つものもあります。こういった色は、ラインタイプがTrimble ラインタイプエディタユーティリティで作成された時に設定されます。例えば、Trimble ラインタイプエディタユーティリティを使用して、ラインタイプ生垣の色を緑と定義することができます。色定義を持つラインタイプを選択する場合には、色フィールドは利用できなくなり、色フィールドにはラインタイプからと表示されます。

長さ

パターン反復の長さを入力します。ラインに対してラインスタイルが選択される時にラインタイプが反復されるパターンである場合、このフィールドを利用できます。例えば、反復されるタイプとして柵ラインを選択することができます。以下の図形がこれを表示します。

ラインタイプによっては長さが固有であり（例、門）、このフィールドは利用できません。

このフィールドの解釈は、寸法オプションの設定に依存します。長さフィールドの単位は寸法オプションが紙に設定されているか地面に設定されているかによって変化します。

紙	紙オプションが選択された場合、長さの値はミリメートル（mm）かインチ（inch）に設定されます。（単位は、座標単位設定によって決まります。こういった単位を設定するには、ファイル/プロジェクトプロパティ/単位とフォーマットタブを選択します。）

例えば寸法オプションが紙に設定されている時に長さフィールドに5を入力すると、5ミリ（または5インチ）のパターン反復を使用してラインを描きます。

スクリーン上の紙の単位の描写は、図面の縮尺を使用して計算されます。図面の縮尺を設定するには、ファイル/ページ設定を選択します。

地面	地面オプションが選択された場合、長さの値は座標単位に対して設定された地面の値です。こういった単位を設定するには、ファイル/プロジェクトプロパティ/単位とフォーマットタブを選択します。

例えば寸法オプションが地面に設定されている時に長さフィールドに5を入力すると、5メートル（または5フィート）のパターン反復を使用してラインを描写します。（図面上とスクリーン上の両方で）

幅

ラインの幅を入力します。ラインタイプによっては幅を適用しないことがあり（例、実線）、その場合、このフィールドは利用できません。以下の図形が、幅フィールドの適用方法を示します。

このフィールドの解釈は、寸法設定によって変化します。

紙	寸法オプションが紙に設定される場合、ラインタイプはミリメートル（mm）かインチ（inch）に設定されます。（単位は、座標単位設定によって決まります。こういった単位を設定するには、ファイル/プロジェクトプロパティ/単位とフォーマットタブを選択します。）

地面	寸法オプションが地面に設定される場合、ラインタイプの値は、ファイル/プロジェクトプロパティ/単位とフォーマットの座標単位に対して設定されます。

寸法

紙か地面をクリックして、上に説明したように長さと幅のフィールドの操作を制御します。


テキストスタイルを作成-編集 ダイアログ
テキストスタイルを作成/編集ダイアログ

テキストスタイルを作成・編集ダイアログを使用して、テキストスタイルを作成したり編集したりします。

この機能を使用するには、

1.	計画表示から、編集/スタイルを選択します。

CADスタイルダイアログが表示されます。

2.	テキストスタイルタブを選択します。

3.	以下の1つを行います。

新規をクリックすると、テキストスタイル作成ダイアログが表示されます。

編集をクリックすると、テキストスタイル編集ダイアログが表示されます。

スタイルを選択すると、編集ボタンを利用できます。

名前

新しいテキストスタイルの名前を入力するか、現存するテキストスタイルの名前を変更します。テキストスタイル名のすべてはユニークでなければなりません。しかし、テキストスタイル、ラインスタイル、ポイントスタイル間には同じ名前を使用することができます。

フォント

テキストスタイルに対するフォントを選択します。

一覧に表示されるフォント名は使用されているMicrosoft Windowsシステムで利用可能なフォントです。

色

テキストスタイルに対する色を選択します。色を選択しない場合には、標準はMicrosoft WindowsのWindowテキスト設定です。ウィンドウテキスト設定を編集するには、コントロールパネルを使用します。ウィンドウテキストが使用される時に、標準スタイルが選択される場合には、そのスタイルはプロット中には黒を標準とします。標準スタイルを選択するには、表示/オプション/画面デザインタブを選びます。黒のスタイルを選択した場合にはそのスタイルはスクリーン上では白を標準とします。

高度

テキストスタイルの高度を入力します。

このフィールドの解釈は、寸法設定に依存します。

紙	紙オプションが選択された場合、高度値はミリメートル（mm）かインチ（inch）に設定されます。（単位は、ファイル/プロジェクトプロパティ/単位とフォーマットタブに設定された座標単位によって決まります。）

例えばオプションが紙に設定されている時に高度フィールドに5を入力すると、5ミリメートルの高度のテキストをメートル法の図面上に作成します。スクリーン上の紙の単位の描写は、ファイル/ページ設定ダイアログからの特定された図面の縮尺を使用して計算されます。

地面	地面オプションが選択された場合、高度値はファイル/プロジェクトプロパティ/単位とフォーマットタブの座標単位に対して設定された地面の値です。

例えば寸法オプションが地面に設定されている時に高度フィールドに5を入力すると、5メートルの高さのテキストをメートル法の図面の上に表示します。（図面上とスクリーン上の両方で）

フォントスタイル

太字や斜体、下線チェックボックスを選択して、希望するテキスト効果を作成します。

寸法

紙と地面をクリックして、上に説明された高度フィールドの操作を制御します。


レイヤーコマンド

このコマンドを使用して、現在のプロジェクトに対するレイヤーを管理します。

この機能を使用するには、

編集/レイヤーを選択します。

レイヤーダイアログが表示されます。


レイヤーダイアログ

概要と詳細

このコマンドを使用して、現在のプロジェクトに対するレイヤーを管理します。

この機能を使用するには以下の1つを行います：

編集/レイヤーを選択します。

レイヤーツール [image] をクリックします。

CtrlとLを一緒に押します。

現在のレイヤーがダイアログの1番上に表示されます。

名前

レイヤーに対する名前を入力します。名前はユニークでなければなりません。エンティティを含むレイヤーの名前を変更すると、エンティティは新しいレイヤーに移動します。

ポイントスタイル

一覧からポイントスタイルを選択します。一覧には、トリンブル社があらかじめ定義したスタイルと、Trimble Geomatics Office で（編集/スタイルを使用して）作成した、または特徴コード処理中に作成した新しいポイントスタイルが含まれます。（詳細に関しては、特徴・属性エディタユーティリティのヘルプを参照してください。）

このポイントスタイルは、ポイントスタイルがレイヤーでと指定された、このレイヤー内のポイントすべてに使用されます。

ラインスタイル

一覧からラインスタイルを選択します。一覧には、トリンブル社があらかじめ定義したスタイルと、Trimble Geomatics Office で（編集/スタイルを使用して）作成した、または特徴コード処理中に作成した新しいラインスタイルが含まれます。（詳細に関しては、特徴・属性エディタユーティリティのヘルプを参照してください。）

このラインスタイルは、ラインスタイルがレイヤーでと指定された、このレイヤー内のラインすべてに使用されます。

テキストスタイル

一覧からテキストスタイルを選択します。一覧には、トリンブル社があらかじめ定義したスタイルと、Trimble Geomatics Office で作成した新しいテキストスタイルが含まれます。（編集/スタイル使用）

このテキストスタイルは、テキストスタイルがレイヤーでと指定された、このレイヤー内のテキストと注釈すべてに使用されます。

ロック

レイヤー内のエンティティがTrimble Geomatics Officeのグラフィックスウィンドウで選択されるようにするには、このチェックボックスをオフにします。このレイヤー内のエンティティが選択されたくない場合には、このチェックボックスをオンにします。このフィールドの値は、レイヤーツールバーのレイヤー選択ツールに表示されます。

レイヤーがロックされている場合には、 [image] アイコンがレイヤーツールバーに表示されます。

レイヤーがロックされていない場合には、 [image] アイコンがレイヤーツールバーに表示されます。

1つ以上のレイヤーがロックフィールドを選択している場合には、ステータスバーに [image] アイコンが表示されます。

ノート：このチェックボックスをオンにすると、以下のどの方法でもレイヤー内のエンティティを見ることはできません。

プロパティウィンドウを使用します。

クリックすることでそれを選択します。

選択メニューで選択コマンドのどれかを使用します。

表示

グラフィックスウィンドウのレイヤー内のエンティティを見るには、このチェックボックスをオンにします。このフィールドの値は、レイヤーツールバーのレイヤー選択ツールに表示されます。

アイコンがレイヤーツールバーに表示されます。

レイヤーが表示されない場合には、 [image] アイコンがレイヤーツールバーに表示されます。

レイヤー内のエンティティを隠すにはこのチェックボックスをオフにします。

ノート：このチェックボックスをオフにすると、Trimble Geomatics Officeのグラフィックスウィンドウでレイヤー内のどのエンティティも見ることはできません。

1つ以上のレイヤーが隠されていると、隠されたレイヤーアイコン [image] がステータスバーに表示されます。つまり、1つ以上のレイヤーが表示プロパティをオフにしてある場合にこのアイコンがステータスバーに表示されるのです。

警告：レイヤーが表示されていない場合には、そのレイヤーからエンティティを選択したり表示したりできません。これは、レイヤーがロックされていてもいなくても適用されます｡つまり、表示オプションはロックオプションを上書きします。

新規

新規をクリックしてプロジェクトに新しいレイヤーを追加します。レイヤーダイアログに新しい列が追加されます。新しいレイヤー内の各行に対する値を入力します。

削除

削除をクリックして、現在反転表示されているレイヤーを削除します。エンティティを含むレイヤーを削除しようとすると警告ダイアログが表示されます。レイヤーを削除するとそのレイヤー内のエンティティも削除されてしまうことを、ダイアログは警告します。

現在

現在をクリックして、選択されたレイヤーを現在のレイヤーにします。現在のレイヤーは反転表示されます。現在のレイヤーは、新しいエンティティが追加されるレイヤーです。レイヤー名を含まずにデータベースに追加されたエンティティのすべて（ポイント、ライン、円弧、曲線、テキスト、注釈）が、現在のレイヤーに追加されます。

ヒント：レイヤーダイアログで複数のエントリを編集することができます。

1.	複数のエントリを選択するためにCtrlキーを使用します。

2.	反転表示された最後のフィールドを編集します。反転表示されたすべてのエントリが更新されます。


レイヤー　－　概要

詳細

利用方法	ダイアログ	関連項目
概要

計画表示では、プロジェクト内の各エンティティはレイヤーに属します。レイヤーは、名前とポイントスタイル、ラインスタイル、テキストスタイルから構成されます。データをレイヤーに整理して、その管理を簡単にします。

これは、大量のデータセットを管理するのに便利です。例えば、木という特徴コードを持つポイントのすべては木と名づけられたレイヤーにグループ分けされることができます。プロジェクトで新しいレイヤーを作成しない限り、すべてのエンティティに対して標準レイヤーが使用されます。

すべてのエンティティ（ポイント、ライン、円弧、曲線、テキスト、注釈）はレイヤーフィールドを持ちます。プロパティウィンドウを使用してエンティティを表示します。エンティティに対するレイヤーを選択するには、以下の方法の1つを使用します。

プロジェクトにエンティティを追加するには、適切なダイアログのレイヤーフィールドからレイヤーを選択します。

特定されたレイヤーを持つファイルをインポートします。

特徴コード処理を使用します。

プロジェクト内に存在するレイヤーを選択するには、プロパティウィンドウを使用します。

プロジェクトに対するレイヤーを管理するには、レイヤーダイアログを使用します。

レイヤー選択ツールバーを使用して、見たり選択したりできるレイヤーを特定します。選んだレイヤー内のエンティティを選択するには、

選択/レイヤーでを選択します。

データベース内のポイントに対してポイントスタイルフィールドにレイヤーでが選択されている場合には、レイヤーに対して特定されたポイントスタイルはポイントに割り当てられます。ラインか曲線、円弧に対してラインスタイルフィールドにレイヤーでが選択されている場合には、レイヤーに対して特定されたラインスタイルがそのライン、曲線、円弧に割り当てられます。同様に、テキストか注釈に対してテキストスタイルフィールドにレイヤーでが選択されている場合には、レイヤーに対して特定されたテキストスタイルがそのテキストか注釈に割り当てられます。


重複ポイントー概要

詳細

利用方法	ダイアログ
概要

Trimble Geomatics Office は同じ名前を持つポイントをインポートするための2つのオプションを提供します。

1.	重複ポイントを常に結合。

2.	許容値内の重複ポイントを結合。どういった水平と垂直許容値でソフトウェアがポイントを結合するか、またはインポート中に重複ポイントを全く解決しないようにするかを特定することができます。

標準では、Trimble Geomatics Office はインポート中に同じ名前を持つポイントを結合するので、重複ポイントは作成されません。（これはデータインポートとしては時間を要する方法です。）

重複ポイントの結合を選ばない場合には、許容値外にある同じポイントに対する観測や座標を持つ1つ以上のファイルがインポートされる時に重複ポイントが作成されます。例として、以下をインポートする場合が挙げられます。

データベースに存在するポイントと同じ名前を持つポイントを含むファイル。そのポイントは許容値外です。

異なるSurvey Controller (*.dc)ファイルからの同じ名前を持つポイント。

必要に応じて、重複ポイントの結合コマンドを使用して、ソフトウェア内からポイントを結合することもできます。

Trimble Geomatics Office のポイント結合方法

1つのポイントは、使用者によって入力されたWGS-84座標と使用者によって入力されたグリッド/ローカル座標を1つずつしか持つことができません。Trimble Geomatics Office は現存するWGS-84かグリッド/ローカル座標のどれを上書きするかを以下のような規則に従って選びます。

1.	最高の質の座標が選ばれます。

2.	データベースに入力した最後の座標成分が使用されます。

ポイント関連レポートは、ポイントを調整するのに使用される測量データの詳細を提供します。インポートレポートは、上書されたか放棄されたあらゆる座標成分を一覧にして示します。

ノート：使用したかった座標をソフトウェアが上書きしてしまった場合には、インポート作業を元に戻し、インポートファイル(またはTrimble Geomatics Officeプロジェクト内のポイント名)を編集し、データを再びインポートしなければなりません。または、重複ポイントオプションダイアログで許容値内の重複ポイントを結合オプションを使用して、インポート作業を元に戻し、データを再びインポートします。Trimble Geomatics Office 内から重複ポイントの名前を変更することができます。


重複ポイントオプションダイアログ

詳細

利用方法	関連項目

重複ポイントオプションダイアログを使用して、同じ名前を持つポイントがプロジェクトにインポートされる時にTrimble Geomatics Office がそれらをどのように管理するかを特定します。

このダイアログの設定はすべてのインポートオプションに適用します。プロジェクトバーを使用してファイルをインポートするか、Trimble Geomatics Officeプロジェクトにファイルをドラッグ・アンド・ドロップするかにかかわらず、ソフトウェアは最後に特定された重複ポイントオプション設定を使用します。重複ポイントオプションを設定するためのテンプレートを作成することができます。

重複ポイントオプションダイアログにアクセスするには、

1.	ファイル/インポートを選択します。インポートダイアログが現れます。

2.	オプションをクリックします。

以下のセクションが有効なオプションを説明します。

重複ポイントを常に結合

このオプションは標準で選択されています。ソフトウェアはインポート中に同じ名前を持つポイントを結合するので、重複ポイントは作成されません。インポート後には、インポートレポートが上書されたか放棄されたあらゆる座標成分を一覧にして示します。

ノート:使用したかった座標をソフトウェアが上書きしてしまった場合には、インポート作業を元に戻し、インポートファイル（またはTrimble Geomatics Officeプロジェクト内のポイント名を編集し、データを再びインポートしなければなりません。または、重複ポイントオプションダイアログで許容値内の重複ポイントを結合オプションを使用して、インポート作業を元に戻し、データを再びインポートします。その後Trimble Geomatics Office 内から重複ポイントの名前を変更することができます。

許容値内の重複ポイントを結合

このオプションを選択する場合、ポイントに対するすべての測量データは、特定された水平と/または垂直許容値内にある限り同じポイントの下に置かれます。標準許容値はプロジェクトプロパティダイアログの再計算タブで特定された未知の水平・垂直許容値から決定されます。インポート後には、インポートレポートが上書されたか放棄されたあらゆる座標成分を一覧にして示します。

このオプションを使用して、インポート中にソフトウェアが重複ポイントを結合しないように特定することもできます。これを行うには、インポートするデータに対する許容値を0.02（これは、水平測量の質の許容値です）と0.050（これは、垂直測量の質の許容値です）に設定します。その後Trimble Geomatics Office 内から重複ポイントの名前を変更することができます。水平許容値と垂直許容値の両方が特定されている場合、重複ポイントが結合されるためにはそれは水平と垂直両方の許容範囲内である必要があります。許容値が特定されていない場合（それは、許容値グループで水平と垂直のチェックボックスがオフになっていることを意味します）、重複ポイントは結合されます。

ノート:デジタルレベルデータをインポートする時には、垂直許容値のみが使用されます。

ノート:許容値が0.000に設定されている場合、重複ポイント座標は結合されようとするポイントと全く同一である必要があります。


ポイント分割コマンド

データを分割することでひとつのポイントから多くのポイントを作成するために、このコマンドを使用します。

データソースごと

すべての観測

データタイプごと(GPS /一般測量機)

この機能を使用するには、編集/ポイント分割を選択します。

ポイント分割ダイアログが表示されます。

ポイント分割オプションを使用して、

重複ポイントを解消します。

それぞれの観測に対する位置を計算します。

GPSデータとグリッド/ローカルデータが同じポイントの下にある時、Trimble Geomatics Office でキャリブレーションを実行します。

一般測量機観測とGPS観測を分離します。


ポイント分割ダイアログ

1つのポイントは、1つ以上のデータソースからの測量データを持つことができます。そのデータソースも1つ以上の観測を含むことができます。しかし、ポイントの計算された位置を引き出すために使用される観測は1つだけです。

ポイント分割オプションを使用して、データソースごと、すべての観測、データタイプごと(GPS /一般測量機)でデータを分割することでポイントを作成することができます。以下を行うためにポイントを分割します。

重複ポイントを解消します。

それぞれの観測に対する位置を計算します。

GPSデータとグリッド/ローカルデータが同じポイントの下にある時、Trimble Geomatics Office でGPSサイトキャリブレーションを実行します。

一般測量機観測とGPS観測を分離します。

ポイント分割と、その操作は同じ名前のポイントを作成します。

例えば、2つのSurvey Controller (*.dc)ファイルを同じプロジェクトにインポートするとします。

最初の.dcファイルは、ポイント'101'に対する従来の観測を含みます。

第二の.dcファイルは、キー入力座標と、同じポイント'101'のGPS観測を含みます。

最初のファイルがインポートされる時、'101'という1つのポイントがプロジェクトに作成され、ポイントの位置を引き出すために観測が使用されます。第2のファイルがインポートされる時、Trimble Geomatics Officeは.dcファイルからのキー入力座標と、プロジェクト内のポイントの位置を比較します。.dcファイルからの測量データは同じポイント'101'に対してなので、プロジェクトからのポイントと.dcファイルからのポイントは自動的に1つに結合されます。測量データは2つのデータソースから出ています。最初のと第2のSurvey Controller (*.dc)ファイルです。ポイントに対しては3組の座標ソースがあります。

一般測量機観測

キー入力座標

GPS観測

ヒント：プロパティウィンドウページのメニューでポイントのデータソースや観測、座標内容などを見ることができます。

複数の観測や座標を含む現在の選択セット内にポイントがある時にのみポイント分割することができます。

ポイント分割ダイアログを利用するには、編集/ポイント分割を選択します。

分割

ポイントを分割して別々のポイントを作成するために、ソフトウェアは以下の方法の1つを利用してデータを分離します。

データソースごと	例えば、.dcファイル
すべての観測	ポイントに対するすべての観測と座標から別々のポイントが作成されます。
データタイプごと	全観測とWGS-84座標は1つのポイントの下に置かれます。グリッド座標と一般測量機観測のすべては別のポイント下に置かれます。
ノート:Trimble Geomatics Office でGPSサイトキャリブレーションを行う必要があり、GPS観測とグリッド座標が同じポイントの下にある場合、データタイプごとにポイント分割オプションを使用します。この作業は2つのポイントを作成します。それは、グリッドポイントとGPSポイントです。その後、こういったポイントを使用してGPSサイトキャリブレーションを行うことができます。

接尾文字(_GPS)を持つGPSポイント名の変更

データタイプでオプションを選択した場合、GPSポイント名を接尾文字を使って変更が利用できるようになります。GPSポイントに付けられる接尾文字を選ぶことで、ポイント名をユニークなものにすることができます。このオプションを選択しない場合には、ポイントはデータタイプで分割され、それぞれの名前は同じ名前を持ちます。

分割統計の表示

このチェックボックスをオンにすると、選択された分割方法を使用して選択されたポイントから作成可能なポイントの数が表示されます。


マルチ編集コマンド

関連項目

このコマンドを使用して、選択されたエンティティの測量関連かCAD関連のエンティティを編集します。このコマンドは、現在選択セットがある場合にのみ有効です。

この機能を使用するには以下の1つを行います。

編集/マルチ編集を選択します。

ショートカットメニューからマルチ編集を選びます。

マルチ編集（測量タブまたはCADタブ）ダイアログが表示されます。


マルチ編集ダイアログ　－　測量タブ

このダイアログを使用して、複数のエンティティにおける測量関連のプロパティを編集します。例えば、アンテナ高が誤ってフィールドに入力されていることがわかっているならば、GPSポイントのグループの使用に対してそれを補正することができます。

この機能を使用するには以下の1つを行います。:

編集/マルチ編集を選択します。

ショートカットメニューからマルチ編集を選択します。

ノート：選択は、それが選択された時に利用可能となります。現在の選択に対して有効なオプションでない場合には、利用可能とならないことがあります。

選択したポイントで編集を行う

このグループは、選択したポイントに対して編集できる測量関連のプロパティを含みます。

アンテナ高設定

このチェックボックスをオンにして以下のフィールドを使用可能にします。こういったフィールドを使用し，ポイントの観測で使用したアンテナ高を変更します。

高さの変更	変更したいポイントのアンテナ高の値を選択します。一覧は、選択されたポイントに対して入力された高度を含みます。選択された値を持つアンテナ高だけが変更されます。
新しいアンテナ高	適用したい正しいアンテナ高の値を入力します。
GPSアンテナの詳細設定

このチェックボックスをオンにして以下のフィールドを使用可能にします。こういったフィールドを使用してアンテナタイプと（または）選択されたポイントの測定方法を変更します。

アンテナタイプ	変更したいポイントに対するアンテナタイプを選択します。
測定方法	変更したいポイントに対する測定方法を選択します。このフィールドの一覧は、選択するアンテナタイプによって決まります。新しいアンテナタイプが選択された場合には、このフィールドはオフになります。
一般測量機ターゲットの詳細設定

このチェックボックスをオンにして以下のフィールドを使用可能にします。こういったフィールドを使用して、選択されたポイントのターゲット高度やプリズム定数を変更します。

ターゲットの高さ	適用したい正しいターゲット高を入力します。
プリズム定数	適用したい正しいプリズム定数を入力します。
レーザーターゲットの高さ設定

このチェックボックスをオンにしてこのフィールドを使用可能にします。適用したい正しいターゲット高を入力します。

これらの編集内容を選択した観測に適用

このグループは、選択した観測（GPS、一般測量機、レーザー）に対して編集できる測量関連のプロパティを含みます。

網平均で使用

このチェックボックスをオンにしてフィールドを使用可能にします。このフィールドを使用して網平均で選択された観測を使用（または除外）します。（網平均モジュールがインストールされている必要があります。）

この設定は、共分散(QC2)情報を持つGPS観測にのみ適用します。これがいいえに設定されている時には観測は網平均に対しては働きません。しかし、ポイントの位置を限定するための再計算中にはそれは使用されます。

観測ステータス設定

このチェックボックスをオンにしてフィールドを使用可能にします。フィールドを使用して、再計算中に観測を有効，無効、チェックとして有効にしたりします。

観測が無効にされている時には、観測は再計算中には使用されません。こういった観測に対するあらゆる測定値差異は報告されます。観測をチェックとして有効にすると、有効にされている観測や座標が他にない場合にのみ、その観測はポイントを調整するために使用されます。

無効にするフラグタイプ

このチェックボックスをオンにしてフィールドを使用可能にします。測量表示内で抑制したい警告フラグタイプを選択します。再計算が行われる場合には警告フラグが再び表示されます。

ノート：特定のフィールド編集するためのチェックボックスをオンにすると、Trimble Geomatics Office が選択されたエンティティにチェックを行ないます。フィールドは選択されたエンティティで使用されてないことがわかると、チェックボックスオプションは使用できなくなります。


マルチ編集ダイアログ　－　CADタブ

このダイアログを使用して、選択内のエンティティのCAD関連のプロパティを編集します。

この機能を使用するには以下の1つを行います。

編集/マルチ編集を選択します。

ショートカットメニューからマルチ編集を選びます。

選択したポイントに編集を実行

このグループは選択されたポイントに対して編集することができるCAD関連のプロパティを含みます。

特徴コード設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したポイントに適用したい特徴コード値を入力します。

レイヤー設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したポイントに割り当てたいレイヤーを選択します。存在しないレイヤーを入力すると、新しいレイヤーダイアログが表示されます。

ポイントスタイル設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したポイントに適用したいポイントスタイルを選択します。存在しないポイントスタイルを入力すると、ポイントスタイルの作成ダイアログが表示されます。

すべての注釈削除

このチェックボックスをオンにして、選択したポイントスタイルに割り当てられたあらゆる注釈を除去します。

これらの変更内容を選択したライン等に適用

このグループは選択されたライン等（ライン、円弧、曲線）に対して編集することができるCAD関連のプロパティを含みます。

レイヤー設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したライン等に割り当てたいレイヤーを選択します。存在しないレイヤーを入力すると、新しいレイヤーダイアログが表示されます。

ラインスタイル設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したライン等に適用したいラインスタイルを選択します。存在しないラインスタイルを入力すると、ラインスタイル作成ダイアログが表示されます。

すべての注釈削除

このチェックボックスをオンにして、選択したライン等に割り当てられたあらゆる注釈を除去します。

これらの変更内容を選択したテキストに適用

このグループは、選択されたテキストに対して編集することができるフィールドを含みます。

レイヤー設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したテキストに割り当てたいレイヤーを選択します。存在しないレイヤーを入力すると、新しいレイヤーダイアログが表示されます。

テキストスタイル設定

このチェックボックスをオンにしてフィールドを使用可能にします。選択したテキストに適用したいテキストスタイルを選択します。存在しないテキストスタイルを入力すると、テキストスタイルの作成ダイアログが表示されます。


観測を有効/無効コマンド

このコマンドを使用して、観測を有効にしたり無効にしたりします。観測を無効にすることは、それがあらゆる測量計算に使用されないことを意味します。

この機能を使用するには以下の1つを行います。:

編集/観測を有効/無効を選択します。

プロパティウィンドウで、観測のステータスフィールドを使用します。

複数編集ダイアログ/測量タブで、観測ステータスをフィールドに設定を使用します。

ノート：再計算は、ポイントに対して計算された位置を決定するときに観測のステータスを検討します。観測を有効/無効機能を使用して、観測を再計算から除去するためにそのステータスを無効にすることができます。

以下の場合にのみ、観測のステータスを変更することができます。

現在選択セットがあり、そして

選択内の観測すべてが同じ観測ステータスを持つ

ノート：現在選択セットに1つ以上の観測がある場合には、複数の観測のステータスを設定することができます。

観測が無効にされている場合、観測ラインの色は濃い赤に変わります。

ノート：同じラインに沿って複数の観測がある場合、すべての観測が無効にされた時のみ観測が赤で示されます。


観測の方向を反転コマンド

ベクトルは、それが観測される方向に適用されます。このコマンドを使用して、観測の方向を逆方向にし、強制に反対方向に適用されるようにします。

この機能を使用するには、編集/観測の方向を反転を選択します。

観測の方向を逆方向にすると、ポイントに対して計算された座標や質が変更するかもしれません。観測を適用し、新しいポイント位置を計算するためには再計算処理が使用されなければなりません。

警告：観測の流れを開始したいポイントが既知の位置（RTK観測ポイントなど）を持たない場合には、観測は適用されません。


新しいレイヤーダイアログ

このダイアログを使用して新しいレイヤーを作成します。エンティティ（ポイントやライン、曲線、円弧、テキスト）を挿入したり編集したりする時に存在しないレイヤー名を入力すると、このダイアログが表示されます。

名前

選択されたエンティティの移動先のレイヤーの名前を入力します。

ポイントスタイル

一覧からポイントスタイルを選択します。一覧には、トリンブル社があらかじめ定義したスタイルと、Trimble Geomatics Office（編集/スタイルを使用して）で作成した、または特徴コード処理中に作成された新しいポイントスタイルが表示されます。

詳細に関しては、特徴・属性エディタユーティリティのヘルプを参考にしてください。

このポイントスタイルは、そのポイントスタイルに対してレイヤーでが選択された、このレイヤー内のすべてのポイントに対して使用されるものです。

ラインスタイル

一覧からラインスタイルを選択します。一覧には、トリンブル社があらかじめ定義したスタイルと、Trimble Geomatics Office（編集/スタイルを使用して）で作成した、または特徴コード処理中に作成された新しいラインスタイルが表示されます。

このラインスタイルは、そのラインスタイルに対してレイヤーでが選択された、このレイヤー内のすべてのラインに対して使用されるものです。

テキストスタイル

一覧からテキストスタイルを選択します。一覧には、トリンブル社があらかじめ定義したスタイルと、Trimble Geomatics Office（編集/スタイルを使用して）で作成した、または特徴コード処理中に作成された新しいテキストスタイルが表示されます。

このテキストスタイルは、そのテキストスタイルに対してレイヤーでが選択された、このレイヤー内のすべてのテキストと注釈に対して使用されるものです。

ロック

Trimble Geomatics Officeのグラフィックスウィンドウで、レイヤー内のエンティティが選択されるようにするには、このチェックボックスをオフにします。このレイヤー内のエンティティが選択されたくない場合にはこのチェックボックスをオンにします。このフィールドの値は、レイヤーツールバーのレイヤー選択ツール内に表示されます。

レイヤーがロックされていると、 [image] アイコンがレイヤーツールバーに表示されます。

レイヤーがロックされていない場合には、 [image] アイコンがレイヤーツールバーに表示されます。

1つ以上のレイヤーがロックフィールドを選択している場合には、 [image] アイコンがステータスバーに表示されます。

ノート：このチェックボックスをオンにすると、以下のどの方法でもレイヤー内のエンティティを見ることはできません。

プロパティウィンドウを使用します。

クリックすることでエンティティを選択します。

選択メニューで選択コマンドのどれかを使用します。

表示

グラフィックスウィンドウのレイヤー内のエンティティを見るには、このチェックボックスをオンにします。このフィールドの値は、レイヤーツールバーのレイヤー選択ツールに表示されます。

レイヤーが表示される場合には、 [image] アイコンがレイヤーツールバーに表示されます。

レイヤーが表示されない場合には、 [image] アイコンがレイヤーツールバーに表示されます。

レイヤー内のエンティティを非表示にするにはこのチェックボックスをオフにします。

ノート：このチェックボックスをオフにすると、Trimble Geomatics Officeのグラフィックスウィンドウでレイヤー内のどのエンティティも見ることはできません。

レイヤー内の1つ以上のエンティティが非表示になっていると、表示アイコン [image] がステータスバーに表示されます。つまり、1つ以上のレイヤーが表示プロパティをオフにしてある場合にこのアイコンがステータスバーに表示されるのです。

警告:レイヤーが表示されていない場合には、そのレイヤーからエンティティを選択したり表示したりできません。これは、レイヤーがロックされていてもいなくても適用されます。つまり、表示オプションはロックオプションを上書きします。


ポイントとテキスト移動コマンド

このコマンドを使用して、ポイントとテキストの移動ダイアログを利用します。現在選択セットがある場合にのみ、このコマンドを利用できます。この機能を使用するには、編集/ポイントとテキスト移動を選択します。

ポイントとテキストの移動ダイアログが表示されます。


移動ダイアログ

このダイアログを使用して、ポイントやテキストを移動します。

この機能を使用するには、編集/ポイントとテキスト移動を選択します。

基準点か固定基準点、網平均の特質を持つポイントは移動されません。移動するように選択したポイントが基準点か固定基準点、網平均の特質を持つ場合には、メッセージが表示されます。

警告:ポイントの移動は、そのポイントに対する座標やそのポイントへのあらゆる観測を無効にします。プロパティウィンドウを使用して、それを有効に戻すことができます。観測や座標を再び有効にすると、移動したポイントがまた元の位置へ戻ります(移動します)。

テキストかポイントを選択し、ダイアログに新しい位置を入力します。ダイアログ内のOKをクリックすると移動されます。

シフト移動

シフト移動オプションを選択して、北へと東への移動（デルタ）によって定義された新しい位置に、選択したテキストやポイントを移動します。

2つのオプションが有効です。

デルタ東距	このオプションは、選択されたエンティティすべての東距に、表示されたデルタ東距の値を追加します。

デルタ北距	このオプションは、選択されたエンティティすべての北距に、表示されたデルタ北距の値を追加します。

ポイントへ移動

ポイントへ移動チェックボックスをオンにして、選択したポイントを別のポイントの位置に移動します。

名前

このフィールドを使用して、新しい位置のポイントに名前を付けたり選択したりします。

座標へ移動

座標へ移動チェックボックスをオンにして、選択したテキストやポイントを新しい位置に移動します。2つのオプションを利用できます。

東距	このフィールドを使用して、選択したポイントに対する新しい東距を入力したり選択したりします。

北距	このフィールドを使用して選択したポイントに対する新しい北距を入力したり選択したりします。

移動したすべてのポイントの標高を0に設定

移動したすべてのポイントの標高を0に設定チェックボックスをオンにして、移動したポイントのポイント標高を0(ヌル)に設定します。このオプションを選択しないと、ポイントの現在の標高が保持されます。

ノート：移動されたポイントへの観測はすべて無効にされます。


重複ポイントダイアログ

詳細

関連項目

プロジェクト内の別のポイントと同じ名前を持つポイントを含むファイルをインポートすると、結果として同じ名前の複数のポイントがプロジェクト内に作成されます。重複ポイントダイアログが表示され、以下のメッセージが示されます。

インポートによって、データベース内に同じ名前を持つポイントが複数作成されました（重複ポイント）

こういった重複ポイントを以下の方法で解決することができます。

物理的に同一のポイントだとわかっている場合には、重複する名前を持つポイントを結合します。

物理的に同一のポイントでない場合には、重複する名前を持つポイントの名前を変更します。


ｺﾒﾝﾄ

この製品をお買い上げいただきましてありがとうございます。この製品に関するご意見やご提案などありましたらどうぞ下記までお知らせください。

Eﾒｲﾙｱﾄﾞﾚｽ　－　ReaderFeedback@trimble.com

ﾏﾆｭｱﾙの最後の読者ｺﾒﾝﾄ用紙にご記入いただきましたら､用紙の下部に記載される手順に従ってご郵送ください。読者ｺﾒﾝﾄ用紙がお手元にない場合には､ｺﾒﾝﾄやご提案を下記にお送りください。

Trimble Navigation Limited
645 North Mary Avenue
P.O.Box 3642
Sunnyvale,CA 94088-3642
U.S.A.

Attention:Technical Publications Group

Phone:+1-408-481-8940
1-800-545-7762
Fax:+1-408-481-7744
www.trimble.com/

ご意見やご提案のすべてはﾄﾘﾝﾌﾞﾙﾅﾋﾞｹﾞｰｼｮﾝ社の所有物となります。

ご協力をどうもありがとうございました。


｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､新しいﾌﾟﾛｼﾞｪｸﾄかﾃﾝﾌﾟﾚｰﾄを作成します。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/新しいﾌﾟﾛｼﾞｪｸﾄを選択します。

標準ﾂｰﾙﾊﾞｰの｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。

CtrlとNを同時に押します。

｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。


｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､新しいﾌﾟﾛｼﾞｪｸﾄかﾃﾝﾌﾟﾚｰﾄを作成します。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/新しいﾌﾟﾛｼﾞｪｸﾄを選択します。

標準ﾂｰﾙﾊﾞｰの｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。

CtrlとNを同時に押します。

ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰの｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ｼｮｰﾄｶｯﾄをｸﾘｯｸします。

名前

作成したいﾌﾟﾛｼﾞｪｸﾄの名前を入力します。ﾌﾟﾛｼﾞｪｸﾄ名を持つ新しいﾌｫﾙﾀﾞが､ﾌｫﾙﾀﾞﾎﾞﾀﾝを使用して選択された現在のﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞの下に作成されます。

ﾃﾝﾌﾟﾚｰﾄ

ﾃﾝﾌﾟﾚｰﾄ一覧は､ｼｽﾃﾑで利用可能なﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄを示します。Trimble Geomatics Office でのﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄの使用は､Microsoft Word の文書ﾃﾝﾌﾟﾚｰﾄやAutoCADのﾌﾟﾛﾄﾀｲﾌﾟ描画の使用に似ています。新しいﾌﾟﾛｼﾞｪｸﾄの基礎を形成するためのﾃﾝﾌﾟﾚｰﾄを使用してすべての新しいﾌﾟﾛｼﾞｪｸﾄを作成します。使用するﾃﾝﾌﾟﾚｰﾄは変更されません。

ﾋﾝﾄ:ﾃﾝﾌﾟﾚｰﾄに追加された新しいCADｽﾀｲﾙは､そのﾃﾝﾌﾟﾚｰﾄを基礎としたﾌﾟﾛｼﾞｪｸﾄ内で利用できます。一定のｴﾘｱで継続する作業が一連の個別ﾌﾟﾛｼﾞｪｸﾄを必要とする場合､すべての新しいﾌﾟﾛｼﾞｪｸﾄで直ちに利用することができるように､そのｴﾘｱに対する特定な座標系や特別なｽﾀｲﾙ､ｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄなどを含むﾃﾝﾌﾟﾚｰﾄを作成することができます。

ﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄが一度定義されると､数多くの異なるﾌﾟﾛｼﾞｪｸﾄに対して何度でもそのﾃﾝﾌﾟﾚｰﾄを使用できます。

一覧で示されたﾃﾝﾌﾟﾚｰﾄ名から､最も適切なﾃﾝﾌﾟﾚｰﾄを選択します。選択するﾃﾝﾌﾟﾚｰﾄは､作成しようとしている新しいﾌﾟﾛｼﾞｪｸﾄの基礎を形成します。

詳細

詳細一覧は､座標系の詳細と選択されたﾃﾝﾌﾟﾚｰﾄのﾍﾃﾞｨﾝｸﾞを示します。これは､最も適切なﾃﾝﾌﾟﾚｰﾄを選択する手助けとなります。

それに加えて､ﾌﾟﾛｼﾞｪｸﾄが作成され保持されるﾌｫﾙﾀﾞが示されます。このﾌｫﾙﾀﾞは､名前ﾌｨｰﾙﾄﾞで直接､またはﾌｫﾙﾀﾞの使用によって定義されたものを反映します。

投影ｵﾌﾟｼｮﾝは､ﾃﾝﾌﾟﾚｰﾄﾌﾟﾛｼﾞｪｸﾄで予め定義されています。投影は変更可能です。

ﾌｫﾙﾀﾞ

ﾌｫﾙﾀﾞをｸﾘｯｸして､新しいﾌﾟﾛｼﾞｪｸﾄを作成したいﾌｫﾙﾀﾞを選択します。

ﾌｫﾙﾀﾞを使用してﾌｫﾙﾀﾞを選択すると､次回からﾌﾟﾛｼﾞｪｸﾄを開いたり作成したりする時にTrimble Geomatics Office が使用する標準位置が変更されます。

｢ﾌｫﾙﾀﾞの検索｣ﾀﾞｲｱﾛｸﾞに示されるﾌｫﾙﾀﾞの系統図を使用して､以下の1つを行います。

ﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞを直接選択します。

ﾌﾟﾛｼﾞｪｸﾄ数を含むﾌｫﾙﾀﾞを選択します。

新規

新規をｸﾘｯｸして､新しいﾌﾟﾛｼﾞｪｸﾄと新しいﾃﾝﾌﾟﾚｰﾄを作成します。

ﾃﾝﾌﾟﾚｰﾄが設定されると､現在選択されているﾃﾝﾌﾟﾚｰﾄを基にして､適切なﾌｫﾙﾀﾞに新しいﾃﾝﾌﾟﾚｰﾄを作成することができます。特別な目的で新しいﾃﾝﾌﾟﾚｰﾄを生成するためにこれを使用することができます。


｢ﾌﾟﾛｼﾞｪｸﾄを開く｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､現存するﾌﾟﾛｼﾞｪｸﾄを開きます。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄを開くを選択します。

標準ﾂｰﾙﾊﾞｰの｢ﾌﾟﾛｼﾞｪｸﾄを開く｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。

CtrlとOを同時に押します。

ﾌﾟﾛｼﾞｪｸﾄを開くﾀﾞｲｱﾛｸﾞが現れます。


｢ﾌﾟﾛｼﾞｪｸﾄを開く｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､現存するﾌﾟﾛｼﾞｪｸﾄを開きます。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄを開くを選択します。

標準ﾂｰﾙﾊﾞｰの｢ﾌﾟﾛｼﾞｪｸﾄを開く｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。

CtrlとOを同時に押します。

注:既に開いているﾌﾟﾛｼﾞｪｸﾄがある場合には､このｱｸｼｮﾝによって現在のﾌﾟﾛｼﾞｪｸﾄが終了されることを警告されます。

注: ﾌﾟﾛｼﾞｪｸﾄのﾌﾟﾚﾋﾞｭｰが｢ﾌﾟﾛｼﾞｪｸﾄを開く｣ﾀﾞｲｱﾛｸﾞに示されます。

名前

開きたいﾌﾟﾛｼﾞｪｸﾄの名前を入力します。

現在のﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞのﾌﾟﾛｼﾞｪｸﾄ一覧が名前ﾌｨｰﾙﾄﾞの下に現れます。名前ﾌｨｰﾙﾄﾞに自動的にその名前を入力するために､こういったﾌﾟﾛｼﾞｪｸﾄ名の1つを選択します。

開きたいﾌﾟﾛｼﾞｪｸﾄへの名前ﾌｨｰﾙﾄﾞのﾊﾟｽを入力することもできます。

例えば､C:\ﾄﾞﾗｲﾌﾞのMYPROJﾌｫﾙﾀﾞにいくつかのﾌﾟﾛｼﾞｪｸﾄを持つとします。

C:\myproj\を入力します。Trimble Geomatics Office は､選択に有効な､このﾌｫﾙﾀﾞ内のﾌﾟﾛｼﾞｪｸﾄを示します。この方法でﾌﾟﾛｼﾞｪｸﾄを開いても､標準ﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞは変更されません。（ﾌｫﾙﾀﾞをｸﾘｯｸすると変更します。）ﾌｫﾙﾀﾞﾎﾞﾀﾝの説明は下記を参照します。

ﾌｫﾙﾀﾞ

ﾌｫﾙﾀﾞをｸﾘｯｸして､ﾌﾟﾛｼﾞｪｸﾄを開きたいﾌｫﾙﾀﾞを選択します。

｢ﾌｫﾙﾀﾞの検索｣ﾀﾞｲｱﾛｸﾞに示されるﾌｫﾙﾀﾞの系統図を使用して､以下の1つを行います。

ﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞを直接選択します。

ﾌﾟﾛｼﾞｪｸﾄ数を含むﾌｫﾙﾀﾞを選択します。

詳細

詳細一覧は､ﾌﾟﾛｼﾞｪｸﾄの座標系とﾍﾃﾞｨﾝｸﾞを示し､ﾌﾟﾛｼﾞｪｸﾄが保管されるﾌｫﾙﾀﾞを含みます。適切なﾌﾟﾛｼﾞｪｸﾄを開く手助けとして､こういった詳細を使用します。詳細は､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/単位とﾌｫｰﾏｯﾄﾀﾌﾞで変更できます。

注:WAVE基線処理ﾓｼﾞｭｰﾙか網平均ﾓｼﾞｭｰﾙがｲﾝｽﾄｰﾙされていない場合に､こういったﾓｼﾞｭｰﾙで作成された現存するﾌﾟﾛｼﾞｪｸﾄを開いても､測量ﾃﾞｰﾀは変更されないままです。機能抑止されたﾓｼﾞｭｰﾙから派生したﾃﾞｰﾀ（誤差楕円や解析基線など）を見ることができます。機能抑止されたﾓｼﾞｭｰﾙの使用を必要とする更に進んだﾀｽｸを行うことはできません。


｢ﾌﾟﾛｼﾞｪｸﾄを閉じる｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､現在のﾌﾟﾛｼﾞｪｸﾄを閉じます。

それにｱｸｾｽするには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄを閉じるを選択します。

ﾌﾟﾛｼﾞｪｸﾄに対する変更のすべて（保存された選択ｾｯﾄと表示を含む）は､ﾌﾟﾛｼﾞｪｸﾄでの作業が進むにつれて保存されます。保存せずにﾌﾟﾛｼﾞｪｸﾄを閉じることもできます。


｢ﾌﾟﾛｼﾞｪｸﾄの削除｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､ﾌﾟﾛｼﾞｪｸﾄを削除します。

それにｱｸｾｽするには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄの削除を選択します。

｢ﾌﾟﾛｼﾞｪｸﾄの削除｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ﾌﾟﾛｼﾞｪｸﾄの削除｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ﾌﾟﾛｼﾞｪｸﾄを削除します。ﾌﾟﾛｼﾞｪｸﾄを閉じる必要があります。

それにｱｸｾｽするには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄの削除を選択します。

ﾋﾝﾄ:ごみ箱から削除したﾌﾟﾛｼﾞｪｸﾄを復元できます。

名前

削除したいﾌﾟﾛｼﾞｪｸﾄの名前を入力します。

削除ﾀﾞｲｱﾛｸﾞで､現在のﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞのﾌﾟﾛｼﾞｪｸﾄ一覧が名前ﾌｨｰﾙﾄﾞの下に現れます。名前ﾌｨｰﾙﾄﾞに自動に名前を入力するために､こういったﾌﾟﾛｼﾞｪｸﾄ名の1つを選択します。

削除したいﾌﾟﾛｼﾞｪｸﾄへのﾃﾞｨﾚｸﾄﾘﾊﾟｽを入力することもできます。

例えば､C:\ﾄﾞﾗｲﾌﾞのMYPROJﾌｫﾙﾀﾞにいくつかのﾌﾟﾛｼﾞｪｸﾄを持つとします。

C:\myproj\を入力します。Trimble Geomatics Office は､選択に有効な､このﾌｫﾙﾀﾞ内のﾌﾟﾛｼﾞｪｸﾄを示します。この方法でﾌﾟﾛｼﾞｪｸﾄを削除しても､ﾌｫﾙﾀﾞを使用する時とは違い､標準ﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞは変更されません。ｸﾞﾙｰﾌﾟ削除の説明は下記を参照してください。

ｸﾞﾙｰﾌﾟ削除

削除したいﾌﾟﾛｼﾞｪｸﾄを表示するには､ﾌﾟﾛｼﾞｪｸﾄｵﾌﾟｼｮﾝを選択します。

削除したいﾃﾝﾌﾟﾚｰﾄを表示するには､ﾃﾝﾌﾟﾚｰﾄｵﾌﾟｼｮﾝを選択します。

ﾌｫﾙﾀﾞ

ﾌｫﾙﾀﾞをｸﾘｯｸして､ﾌﾟﾛｼﾞｪｸﾄを削除したいﾌｫﾙﾀﾞを選択します。ﾌｫﾙﾀﾞを使用してﾌｫﾙﾀﾞを選択すると､次回からﾌﾟﾛｼﾞｪｸﾄを開いたり作成したりする時にTrimble Geomatics Office が使用する標準が変更されます。

｢ﾌｫﾙﾀﾞの検索｣ﾀﾞｲｱﾛｸﾞに示されるﾌｫﾙﾀﾞの系統図を使用して､以下の1つを行います。

ﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞを直接選択します。

ﾌﾟﾛｼﾞｪｸﾄ数を含むﾌｫﾙﾀﾞを選択します。

削除

削除をｸﾘｯｸして､選択されたﾌﾟﾛｼﾞｪｸﾄを削除します。ﾌﾟﾛｼﾞｪｸﾄに含まれるすべてのﾌｫﾙﾀﾞとﾌｧｲﾙは削除されます。

詳細

詳細ｸﾞﾙｰﾌﾟは､ﾌﾟﾛｼﾞｪｸﾄの座標系とﾍﾃﾞｨﾝｸﾞを示し､ﾌﾟﾛｼﾞｪｸﾄが保管されているﾌｫﾙﾀﾞを公開します。正しいﾌﾟﾛｼﾞｪｸﾄを削除していることを確認する手助けとしてこういった詳細を使用します。


｢ｲﾝﾎﾟｰﾄ｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､ｲﾝﾎﾟｰﾄﾀﾞｲｱﾛｸﾞを開きます。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。

標準ﾂｰﾙﾊﾞｰの｢ｲﾝﾎﾟｰﾄ｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。

ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰのｲﾝﾎﾟｰﾄｸﾞﾙｰﾌﾟを使用します。

｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ｴｸｽﾎﾟｰﾄ｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､他のﾌｫｰﾏｯﾄかTrimble装置にﾃﾞｰﾀをｴｸｽﾎﾟｰﾄします。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。

標準ﾂｰﾙﾊﾞｰの｢ｴｸｽﾎﾟｰﾄ｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。

｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ﾍﾟｰｼﾞ設定｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､ﾌﾟﾛｯﾄを生成する前にﾍﾟｰｼﾞﾚｲｱｳﾄ設定を変更します。

以下を行うことができます。

ﾌﾟﾛｯﾄに使用したい平面図ﾌｫｰﾑを選択します。

ﾌﾟﾛｯﾄ縮尺､始点､向きを割り当てます。

それにｱｸｾｽするには､ﾌｧｲﾙ/ﾍﾟｰｼﾞ設定を選択します。

｢ﾍﾟｰｼﾞ設定｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ﾍﾟｰｼﾞ設定｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ﾌﾟﾛｯﾄを生成する前にﾍﾟｰｼﾞﾚｲｱｳﾄ設定を変更します。ﾌﾟﾛｯﾄに使用したい平面図ﾌｫｰﾑを選択したり､ﾌﾟﾛｯﾄ縮尺､始点､方位を割り当てたりできます。

それにｱｸｾｽするには､ﾌｧｲﾙ/ﾍﾟｰｼﾞ設定を選択します。

平面図ﾌｫｰﾑ

平面図ﾌｫｰﾑは､ﾌﾟﾛｯﾄを描くためのﾃﾝﾌﾟﾚｰﾄを提供します。描画成分（北矢印や会社のﾛｺﾞなど）だけでなく､ｸﾘｯﾋﾟﾝｸﾞﾘｰｼﾞｮﾝやﾌﾚｰﾑ､ﾗｲﾝﾜｰｸ､ﾃｷｽﾄ注釈をも提供するためにこのﾃﾝﾌﾟﾚｰﾄをｶｽﾀﾏｲｽﾞすることができます。平面図ﾌｫｰﾑは､選択されたﾌﾟﾘﾝﾀｰかﾌﾟﾛｯﾀｰに対するﾍﾟｰｼﾞｻｲｽﾞｾｯﾄに適用され､ﾌﾟﾘﾝﾀｰかﾌﾟﾛｯﾀｰの縦か横設定に従います。

印刷設定を使用してこういった設定を変更することができます。

ﾌｧｲﾙﾌｨｰﾙﾄﾞに､希望する平面図ﾌｫｰﾑのﾌｧｲﾙ名を入力します。

検索

検索ﾀﾞｲｱﾛｸﾞは､利用可能な平面図ﾌｫｰﾑ(*.frm)ﾌｧｲﾙを表示します。

必要な平面図ﾌｫｰﾑのﾌｧｲﾙ名を選択します。

Trimble Navigation Limited　は､ご利用のためにいくつかの異なる平面図ﾌｫｰﾑを提供します。ご自分で平面図ﾌｫｰﾑを作成することもできます。詳細に関しては､平面図ﾌｫｰﾑ－概要を参照してください。

縮尺､ﾌﾟﾛｯﾄ回転､原点 N（北）､原点 E（東）

こういったﾌｨｰﾙﾄﾞを使用して､ﾌﾟﾛｯﾄされるべきﾌﾟﾛｼﾞｪｸﾄのｴﾘｱを定義します。

縮尺を設定してから､ﾌﾟﾛｯﾄされるべきﾌﾟﾛｼﾞｪｸﾄのｴﾘｱを象徴する｢ﾌﾟﾛｯﾄﾎﾞｯｸｽ｣がｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに現れます。それは､原点座標を基礎としています。ﾌﾟﾛｯﾄの適用範囲を増やしたり減らしたりするためには､縮尺を変更します。

ﾋﾝﾄ:必要とされるﾌﾟﾛｯﾄの方位を得るための値にﾌﾟﾛｯﾄ回転ﾌｨｰﾙﾄﾞを設定します。このﾌｨｰﾙﾄﾞの値は､ﾌﾟﾛｯﾄの北距ﾎﾟｲﾝﾄの回転ではなく､ﾌﾟﾛｯﾄﾍﾟｰｼﾞの脇の方位を設定します。ﾌﾟﾛｯﾄﾎﾞｯｸｽは移動するかもしれません。その場合には､ﾌﾟﾛｼﾞｪｸﾄﾃﾞｰﾀに適合するようにﾃﾞｰﾀの周りを図で示すように移動させます。

原点北距か原点東距ﾌｨｰﾙﾄﾞをｸﾘｯｸしてから､｢ﾌﾟﾛｯﾄﾎﾞｯｸｽ｣をｸﾘｯｸしてﾄﾞﾗｯｸﾞし､必要なｴﾘｱを覆うようにします。必要なﾌﾟﾛｯﾄ方位を得るための値をﾌﾟﾛｯﾄ回転ﾌｨｰﾙﾄﾞに設定することができます。このﾌｨｰﾙﾄﾞを使用することで､ﾌﾟﾛｯﾄの北距ﾎﾟｲﾝﾄの回転ではなく､ﾌﾟﾛｯﾄﾍﾟｰｼﾞの脇の方位を特定することができます。

OK

OKをｸﾘｯｸして､ﾌﾟﾛｯﾄﾍﾟｰｼﾞ設定を承認します。こういった設定詳細は､保存されてから､ﾌﾟﾛｯﾄ/印刷ｵﾌﾟｼｮﾝで使用されます。

最適

最適をｸﾘｯｸして､現在表示されているﾌﾟﾛｼﾞｪｸﾄﾃﾞｰﾀすべてをﾌﾟﾛｯﾄするために､縮尺と原点ﾌｨｰﾙﾄﾞに対する最適値をｼｽﾃﾑに計算させます。このｵﾌﾟｼｮﾝを使用する時には､ﾌﾟﾛｯﾄ方位は0ｰに合わされています。

印刷設定

印刷設定をｸﾘｯｸして､ｼｽﾃﾑの印刷設定ﾀﾞｲｱﾛｸﾞを開きます。このﾀﾞｲｱﾛｸﾞを使用して､適切なﾌﾟﾘﾝﾀｰかﾌﾟﾛｯﾀｰを選択し､紙のｻｲｽﾞとｿｰｽを選び､紙上のﾌﾟﾛｯﾄ出力の方位（縦か横）を選択します。


平面図ﾌｫｰﾑ　－　概要

平面図ﾌｫｰﾑ(*.frm)ﾌｧｲﾙはﾃｷｽﾄﾌｧｲﾙとして保管されます。それは､平面図ﾌｫｰﾑ上に置かれるべきものとそれがどこに置かれるのかを叙述する一連の説明を含みます。平面図ﾌｫｰﾑの定義には､希望するﾚｲｱｳﾄを建設するために､ﾗｲﾝやﾃｷｽﾄ､記号(例､北距ﾎﾟｲﾝﾄ)､そしてMicrosoft Windowsの拡張ﾒﾀﾌｧｲﾙ(*.wmf)を含むことができます。

ｺﾒﾝﾄ

提供された平面図ﾌｫｰﾑには､平面図ﾌｫｰﾑ定義で利用可能な様々なｺﾏﾝﾄﾞの意味を説明するｺﾒﾝﾄがあります。ﾃｷｽﾄｴﾃﾞｨﾀを使用して､平面図ﾌｫｰﾑの定義を編集します。提供された平面図ﾌｫｰﾑの定義は､通常主要ﾌﾟﾛｸﾞﾗﾑﾌｫﾙﾀﾞ下のｼｽﾃﾑﾌｫﾙﾀﾞに置かれています。（典型的には､C:\ﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\Trimble\Trimble Geomatics Office）

ﾋﾝﾄ:Trimble Geomatics Office のｲﾝｽﾄｰﾙ中には､ﾌｧｲﾙ拡張子に対しる｢開く｣作業がMicrosoft Notepadﾃｷｽﾄｴﾃﾞｨﾀに割り当てられます。そのために､平面図ﾌｫｰﾑﾌｧｲﾙを選択する時や､Microsoft Windows Explorerﾌﾟﾛｸﾞﾗﾑ内にいる時に､.frmﾌｧｲﾙを反転表示させると､Microsoft Notepadの平面図ﾌｫｰﾑ詳細を提示するためにｼｮｰﾄｶｯﾄﾒﾆｭｰの｢開く｣ｵﾌﾟｼｮﾝを使用できます。

詳細に関しては､平面図ﾌｫｰﾑ定義詳細を参照してください。


平面図ﾌｫｰﾑ定義詳細

概要

平面図ﾌｫｰﾑ定義は､標準Windows *.iniﾌｧｲﾙﾌｫｰﾏｯﾄに似たﾌｫｰﾏｯﾄで保管されます。これは､角ｶｯｺ( [ ] )で囲まれた多くのｾｸｼｮﾝﾍﾃﾞｨﾝｸﾞから構成されます。それぞれのｾｸｼｮﾝでは､個々の項目が独特な名前を付けられ､適切な値を｢＝｣記号を使用して割り当てられ定義されています。ｺﾒﾝﾄはﾌｧｲﾙ内に置かれることができますが､それはそれ自身のﾗｲﾝ上になければならず､そのﾗｲﾝはｾﾐｺﾛﾝ(;)で始まらなければなりません。

平面図ﾌｫｰﾑ定義内の特別な座標系は､同じ平面図ﾌｫｰﾑが異なるﾌﾟﾛｯﾄﾍﾟｰｼﾞｻｲｽﾞで使用されることを許可します。すべての座標値はﾐﾘﾒｰﾄﾙであると仮定され､常に括弧内のｶﾝﾏで区切られた一組（x〔または水平〕値が最初で､y〔または垂直〕値が続く）の値で特定されます。

例えば､(20,40)は有効な座標ﾎﾟｼﾞｼｮﾝです。ﾍﾟｰｼﾞ左上のﾌﾟﾛｯﾄ可能ｺｰﾅｰは､+0.0､+0.0という座標を持つと定義されます。すべての正の座標値は､このﾎﾟｼﾞｼｮﾝの右･下にあると解釈されます。ﾍﾟｰｼﾞ右下のﾌﾟﾛｯﾄ可能ｺｰﾅｰは､－0.0､－0.0という座標を持つと定義されます。すべての負の座標値は､このﾎﾟｼﾞｼｮﾝの左･上にあると解釈されます。

注:ﾍﾟｰｼﾞのﾌﾟﾛｯﾄ可能ｺｰﾅｰは､ﾌﾟﾛｯﾀｰかﾌﾟﾘﾝﾀｰの与えられたﾍﾟｰｼﾞ上で実行可能な実際のﾌﾟﾛｯﾄ（または印刷）の限界です。こういった限界は､ﾌﾟﾛｯﾀｰやﾌﾟﾘﾝﾀｰによって異なります。限界は､例えばﾌﾟﾛｯﾀｰのﾛｰﾗｰにﾍﾟｰｼﾞがどのように置かれているかというような要素に影響されます。

図示するために､以下の表は様々な座標ﾎﾟｼﾞｼｮﾝやその解釈を示しています。

ｾｸｼｮﾝ

平面図ﾌｫｰﾑ定義ﾌｧｲﾙ内のｾｸｼｮﾝは以下の通りです。


｢ﾌﾟﾛｯﾄ / 印刷｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､

ｲﾝｽﾄｰﾙされているﾌﾟﾛｯﾀｰやﾌﾟﾘﾝﾀｰの一覧を表示します。

標準ﾌﾟﾛｯﾀｰかﾌﾟﾘﾝﾀｰを設定します。

選択されたﾌﾟﾛｯﾀｰかﾌﾟﾘﾝﾀｰに対するその他のﾌﾟﾛｯﾄか印刷ｵﾌﾟｼｮﾝにｱｸｾｽします。

それにｱｸｾｽするには､以下の1つを行います。

ﾌｧｲﾙ/ﾌﾟﾛｯﾄ/印刷を選択します。

CtrlとPを同時に押します。

Trimble Geomatics Office で印刷ができるようにするには､以下を行う必要があります。

ご利用のｺﾝﾋﾟｭｰﾀｰかﾈｯﾄﾜｰｸにﾌﾟﾛｯﾀｰかﾌﾟﾘﾝﾀｰを接続します。

Microsoft Windows設定かMicrosoft Windowsｺﾝﾄﾛｰﾙﾊﾟﾈﾙを使用してﾌﾟﾛｯﾀｰ/ﾌﾟﾘﾝﾀｰのﾄﾞﾗｲﾊﾞｰをｲﾝｽﾄｰﾙします。（既にｲﾝｽﾄｰﾙされていない場合）詳細に関しては､Microsoft Windowsのﾍﾙﾌﾟを参照してください。

ﾌﾟﾛｯﾄか印刷設定ﾀﾞｲｱﾛｸﾞで､使用したいﾌﾟﾛｯﾀｰかﾌﾟﾘﾝﾀｰを選択します。

注:ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳにｸﾞﾘｯﾄﾞﾗｲﾝが表示されている場合には､ﾌﾟﾛｯﾄ上にもそれが引かれます。


｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを開きます。それにｱｸｾｽするには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します。


｢最近のﾌﾟﾛｼﾞｪｸﾄ｣ｺﾏﾝﾄﾞ
｢最近使用したﾌﾟﾛｼﾞｪｸﾄ｣ｺﾏﾝﾄﾞ

ﾌｧｲﾙﾒﾆｭｰは､最近使用した4つのﾌﾟﾛｼﾞｪｸﾄを列記しています。

最近使用したﾌﾟﾛｼﾞｪｸﾄを開くには､ﾌｧｲﾙﾒﾆｭｰ一覧から1つを選択します。


｢終了｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､現在のﾌﾟﾛｼﾞｪｸﾄを閉じ､Trimble Geomatics Office を終了します。

Trimble Geomatics Office は変更を自動的に保存します。


｢ﾌﾟﾛｼﾞｪｸﾄのｺﾋﾟｰ｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､現存するTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄをｺﾋﾟｰします。このｺﾏﾝﾄﾞは､開いているﾌﾟﾛｼﾞｪｸﾄがない場合にのみ利用できます。

｢ｺﾋﾟｰするﾌﾟﾛｼﾞｪｸﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ｺﾋﾟｰするﾌﾟﾛｼﾞｪｸﾄ｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ｺﾋﾟｰしたいﾌﾟﾛｼﾞｪｸﾄを選択します。

このﾀﾞｲｱﾛｸﾞにｱｸｾｽするには､

ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄのｺﾋﾟｰを選択します。

このｵﾌﾟｼｮﾝは､開いているﾌﾟﾛｼﾞｪｸﾄがない場合にのみ利用できます。

一覧からﾌﾟﾛｼﾞｪｸﾄを選択します。

選択されたﾌﾟﾛｼﾞｪｸﾄの詳細が､ﾌﾟﾛｼﾞｪｸﾄ一覧の下に現れます。

ﾌｫﾙﾀﾞ

別のﾌｫﾙﾀﾞからﾌﾟﾛｼﾞｪｸﾄを選択するには､ﾌｫﾙﾀﾞをｸﾘｯｸします。

ｺﾋﾟｰしたいﾌﾟﾛｼﾞｪｸﾄを選択する時､OKをｸﾘｯｸします。

｢ﾌﾟﾛｼﾞｪｸﾄのｺﾋﾟｰ先｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ﾌﾟﾛｼﾞｪｸﾄのｺﾋﾟｰ先｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ｺﾋﾟｰしようとしているﾌﾟﾛｼﾞｪｸﾄに新しい名前を入力します。

ﾌﾟﾛｼﾞｪｸﾄﾀｲﾄﾙ

ﾌﾟﾛｼﾞｪｸﾄに対する名前を入力します。

ﾌｫﾙﾀﾞ

以下の1つを行います。

別のﾌｫﾙﾀﾞにﾌﾟﾛｼﾞｪｸﾄをｺﾋﾟｰするには省略ﾎﾞﾀﾝをｸﾘｯｸします。

ｷｰﾎﾞｰﾄﾞを使用してﾌｫﾙﾀﾞﾊﾟｽを入力します。


ﾌｧｲﾙﾄﾗﾝｽﾌｧﾌﾟﾛﾄｺﾙ(FTP)ｻｲﾄ

ﾄﾘﾝﾌﾞﾙ社のFTPｻｲﾄを利用して､ﾌｧｲﾙを送ったり､ｿﾌﾄｳｴｱﾊﾟｯﾁやﾕｰﾃｨﾘﾃｨ､よく寄せられる質問･回答などのﾌｧｲﾙを受け取ったりできます。ﾄﾘﾝﾌﾞﾙ社のWorld Wide WebｻｲﾄからFTPｻｲﾄにｱｸｾｽできます。www.trimble.com/support/support.htm


GISﾌｫｰﾏｯﾄｰ概要
GISﾌｫｰﾏｯﾄ　‐　概要

詳細

利用方法	関連項目
概要

ﾎﾟｲﾝﾄとそれに関連する属性をTrimble Geomatics Office から多様な地理的情報ｼｽﾃﾑ(GIS)のﾌｫｰﾏｯﾄへとｴｸｽﾎﾟｰﾄすることができます。ﾗｲﾝや円弧､曲線､ﾃｷｽﾄ､注釈はｴｸｽﾎﾟｰﾄされません。

以下の表を参照してください。

ｴｸｽﾎﾟｰﾄ中に､ｴｸｽﾎﾟｰﾄするための新しい属性を作成することができます。(例えば､属性が収集された時間や日付､またはﾎﾟｲﾝﾄの標高)

ﾎﾟｲﾝﾄとその属性をｴｸｽﾎﾟｰﾄするためにｶｽﾀﾑASCIIｴｸｽﾎﾟｰﾄかﾚﾎﾟｰﾄﾌｫｰﾏｯﾄを作成することもできます。

2つのｶｽﾀﾑGISﾌｫｰﾏｯﾄが挙げられています。

名前､緯度､経度､高度､すべての属性（ﾛｰｶﾙ）

名前､北､東､標高､すべての属性

多種のGISﾌｫｰﾏｯﾄにﾃﾞｰﾀをｴｸｽﾎﾟｰﾄするためにGISﾀﾌﾞを使用します。

このﾀﾌﾞにｱｸｾｽするには､

1.	1.	以下の1つを行ってください。

ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。

ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰのｴｸｽﾎﾟｰﾄｸﾞﾙｰﾌﾟを使用します。

ｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが表示されます。

2.	2.	GISﾀﾌﾞを選択します。

ｶｽﾀﾑﾌｫｰﾏｯﾄをこのﾀﾌﾞに移動することができます。詳しくはAsciiexp.dat ﾌｧｲﾙを参照してください。

GISﾌｫｰﾏｯﾄのｴｸｽﾎﾟｰﾄに関しては､GISｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを参照してください。

このﾀﾌﾞは以下のﾌｫｰﾏｯﾄを持ちます。


ArcViewﾌｧｲﾙ(*.dbf､*.shp､*.shx)ｵﾌﾟｼｮﾝ

ArcViewﾌｫｰﾏｯﾄへとｴｸｽﾎﾟｰﾄすると､属性を持つ各特徴ｺｰﾄﾞに対して3つのﾌｧｲﾙが作成されます。

以下の表がそのﾌｧｲﾙを説明します。

これらのﾌｧｲﾙはﾊﾞｲﾅﾘﾌｧｲﾙです。ﾃｷｽﾄｴﾃﾞｨﾀでこれらのﾌｧｲﾙを表示したり編集したりすることはできません。

Trimble Geomatics Office がこれらのﾌｧｲﾙに自動的に名前を付けます。

例えば､｢木｣という特徴ｺｰﾄﾞに対して属性を持つﾎﾟｲﾝﾄがある場合には､以下のﾌｧｲﾙが作成されます。

木.shp

木.shx

木.dbf

ArcView設定に関しては､ｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝﾀﾞｲｱﾛｸﾞを参考にしてください。ArcViewは､すべてのﾌｫｰﾏｯﾄに対する設定以外の特別な設定はありません。

ﾉｰﾄ：ArcViewﾊﾞｰｼﾞｮﾝ3.1かそれ以降のみが3Dﾎﾟｲﾝﾄをｻﾎﾟｰﾄします。


属性を持つAutoCADﾌｧｲﾙ（*.dxf）ｵﾌﾟｼｮﾝ

属性を持つAutoCADﾌｧｲﾙ（*.dxf）ｵﾌﾟｼｮﾝにｴｸｽﾎﾟｰﾄすると.dxfﾌｧｲﾙが作成されます。

ｸﾞﾗﾌｨｯｸで表のﾃﾞｰﾀを交換するためにDrawing eXchange Format (.dxf)ﾌｧｲﾙを使用します。

設定

ｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝﾀﾞｲｱﾛｸﾞで説明された標準設定に加えて､AutoCAD特定設定もあります。

ｵﾌﾟｼｮﾝをｸﾘｯｸします。ｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝﾀﾞｲｱﾛｸﾞが表示されます。

ﾃｷｽﾄｻｲｽﾞ

出力ﾌｧｲﾙのﾃｷｽﾄのｻｲｽﾞを特定するために2つのｵﾌﾟｼｮﾝがあります。

自動	ﾃｷｽﾄｻｲｽﾞは入力ﾌｧｲﾙから自動的に計算されます。
固定	ﾃｷｽﾄｻｲｽﾞは固定されます。以下の1つを行ってください。 ﾃｷｽﾄｻｲｽﾞﾌｨｰﾙﾄﾞで､希望のﾃｷｽﾄｻｲｽﾞを入力します。 矢印ﾎﾞﾀﾝを使用します。
ﾌﾞﾛｯｸｵﾌﾟｼｮﾝ

属性情報をﾌﾞﾛｯｸでｴｸｽﾎﾟｰﾄするために､ﾌﾞﾛｯｸﾁｪｯｸﾎﾞｯｸｽで｢特徴のｴｸｽﾎﾟｰﾄ｣を選択します。これは､.dxfﾌｫｰﾏｯﾄをｻﾎﾟｰﾄするGISかCADｼｽﾃﾑへと読み込まれる時に属性が問いただされ編集されることを意味します。｢ﾌﾞﾛｯｸ挿入ﾎﾟｲﾝﾄ｣が有効になります。ﾌﾞﾛｯｸに挿入ﾎﾟｲﾝﾄを配置するには2つのｵﾌﾟｼｮﾝがあります。

原点	挿入ﾎﾟｲﾝﾄをﾌﾞﾛｯｸの0,0ﾎﾟｼﾞｼｮﾝに配置します。

質量中心	挿入ﾎﾟｲﾝﾄをﾌﾞﾛｯｸの計算された質量中心に配置します。

ﾌﾞﾛｯｸﾁｪｯｸﾎﾞｯｸｽの｢特徴をｴｸｽﾎﾟｰﾄ｣が選択されていない場合には､このｵﾌﾟｼｮﾝは利用できません。その代わり､特徴に対するﾎﾟｼﾞｼｮﾝ情報はPOLYLINEかﾎﾟｲﾝﾄｴﾝﾃｨﾃｨとして保管され､属性情報はﾃｷｽﾄとして書き込まれます。ﾃｷｽﾄは各特徴に対して適切なﾚｲﾔｰに書き込まれます。｢ﾌﾞﾛｯｸ挿入ﾎﾟｲﾝﾄ｣ｸﾞﾙｰﾌﾟは利用できません。

ﾉｰﾄ：ﾌﾞﾛｯｸでｴｸｽﾎﾟｰﾄしない場合､属性名はｴｸｽﾎﾟｰﾄされません。属性に対する値だけがｴｸｽﾎﾟｰﾄされます。AutoCAD GISﾊﾟｯｹｰｼﾞのどれか（例えば､AutoCAD Map）にｴｸｽﾎﾟｰﾄをする場合､属性名が含まれるように常にﾌﾞﾛｯｸでｴｸｽﾎﾟｰﾄするようにします。

ﾚｲﾔｰｵﾌﾟｼｮﾝ

.dxfﾌｧｲﾙは各ﾚｲﾔｰに異なる情報を整理します。こういったﾚｲﾔｰを別々に独立して構成することができます。以下が2つのﾚｲﾔｰｵﾌﾟｼｮﾝです。

1つのﾚｲﾔｰに1つの特徴　－　各特徴に対して異なるﾚｲﾔｰが作成されます。例えば､電柱の特徴は木の特徴とは異なるﾚｲﾔｰに配置されます。各ﾚｲﾔｰのﾚｲﾔｰ名は特徴の名前です。

1つのﾚｲﾔｰにすべての特徴　－　すべての特徴は1つのﾚｲﾔｰに配置されます。ﾚｲﾔｰ名ﾌｨｰﾙﾄﾞを利用できます。ﾚｲﾔｰ名ﾌｨｰﾙﾄﾞにﾚｲﾔｰの名前を入力します。ﾚｲﾔｰ名ﾌｨｰﾙﾄﾞは空白であることはできません。

特徴名内のｽﾍﾟｰｽを下線に変更

.dxfﾌｧｲﾙを読み込むﾌﾟﾛｸﾞﾗﾑによっては､ｽﾍﾟｰｽを含む.dxfﾌｧｲﾙのﾚｲﾔｰ名を受け付けないものがあります。このｵﾌﾟｼｮﾝを選択すると､特徴名内のすべてのｽﾍﾟｰｽを下線文字(_)に変換します。


MapInfoﾌｧｲﾙ（*.mif､*.mid）ｵﾌﾟｼｮﾝ

MapInfoﾌｫｰﾏｯﾄにｴｸｽﾎﾟｰﾄすると､属性を持つ各特徴ｺｰﾄﾞに対して2つのﾌｧｲﾙが作成されます。それは以下の表で説明されます。

これらのﾌｧｲﾙはﾃｷｽﾄﾌｧｲﾙです。ﾃｷｽﾄｴﾃﾞｨﾀで表示したり編集したりできます。これらのﾌｧｲﾙの各例が下に示されています。

MIFﾌｧｲﾙ

ﾊﾞｰｼﾞｮﾝ2

  区切り符号"	"

  座標系 地球投影 1, 104

ｺﾗﾑ3

  高度_m  DECIMAL(5,0)

  注意が必要  CHAR(30)

  特記  CHAR(30)

ﾃﾞｰﾀ

ﾎﾟｲﾝﾄ 700345.32 306565.45

ﾎﾟｲﾝﾄ 700356.47 306125.38

ﾎﾟｲﾝﾄ 700937.71 306505.41

MIDﾌｧｲﾙ

1	はい	枝が電線の中

2	はい	空き

3	いいえ	電柱の脇

Trimble Geomatics Office がこれらのﾌｧｲﾙに自動的に名前を付けます。例えば､｢木｣という特徴ｺｰﾄﾞに対して属性を持つﾎﾟｲﾝﾄがある場合には､以下のﾌｧｲﾙが作成されます。

木.mif

木.mid

MapInfoは､すべてのﾌｫｰﾏｯﾄに対する設定以外の特別な設定はありません。それは､ｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝﾀﾞｲｱﾛｸﾞの項で説明されています。

ﾉｰﾄ：MapInfoは2Dﾎﾟｲﾝﾄのみをｻﾎﾟｰﾄします。


Microstationﾌｧｲﾙ（*.dgn）ｵﾌﾟｼｮﾝ

Microstation (*.dgn)ﾌｫｰﾏｯﾄでｴｸｽﾎﾟｰﾄすると､1つのﾌｧｲﾙが作成されます。ｴｸｽﾎﾟｰﾄしたいﾌｧｲﾙに名前を入力する必要があります。

構成

ｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝﾀﾞｲｱﾛｸﾞですべてのﾌｫｰﾏｯﾄに対して有効な設定に加えて､Microstation DGNﾌｫｰﾏｯﾄにｴｸｽﾎﾟｰﾄする方法を構成するために以下のｵﾌﾟｼｮﾝを利用できます。

ｽﾅｯﾌﾟを可能にする

このﾁｪｯｸﾎﾞｯｸｽを選択して､作成された.dgnﾌｧｲﾙが｢ｽﾅｯﾌﾟを可能にする｣特徴を持つことを確実にします。Microstationでこのｵﾌﾟｼｮﾝを持つ場合､特徴の近くをｸﾘｯｸするとその正確なﾎﾟｼﾞｼｮﾝをｶｰｿﾙがｽﾅｯﾌﾟします。

解像度の単位

出力ﾌｧｲﾙにGPSﾎﾟｼﾞｼｮﾝに対する解像度の単位を入力します。.dgnﾌｫｰﾏｯﾄ内に現存するﾃﾞｰﾀを手持ちのGPSﾃﾞｰﾀで上塗りしたい場合には､両方のﾌｧｲﾙの解像度の単位が同じである必要があります。

2つのｵﾌﾟｼｮﾝは以下の通りです。

自動	解像度の単位は､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄでﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/単位とﾌｫｰﾏｯﾄﾀﾌﾞの座標小数位ﾌｨｰﾙﾄﾞから自動的に計算されます。

ﾕｰｻﾞｰ定義	解像度の単位はこのﾌｨｰﾙﾄﾞでﾕｰｻﾞｰによって特定されることができます。

ｸﾞﾛｰﾊﾞﾙ原点

ｸﾞﾛｰﾊﾞﾙ原点が計算される方法を選択します。.dgnﾌｫｰﾏｯﾄ内の現存するﾃﾞｰﾀを手持ちのGPSﾃﾞｰﾀで上塗りしたい場合には､両方のﾌｧｲﾙのｸﾞﾛｰﾊﾞﾙ原点が同じである必要があります。

2つのｵﾌﾟｼｮﾝは以下の通りです。

自動	ｸﾞﾛｰﾊﾞﾙ原点は入力ﾌｧｲﾙ（複数ﾌｧｲﾙのこともあり）から自動的に計算されます。

ﾕｰｻﾞｰ定義	ｸﾞﾛｰﾊﾞﾙ原点のXとY､Z座標はこのﾌｨｰﾙﾄﾞでﾕｰｻﾞｰによって特定されることができます。


ｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝﾀﾞｲｱﾛｸﾞ（GISｴｸｽﾎﾟｰﾄ）

ｴｸｽﾎﾟｰﾄする先の地理的情報ｼｽﾃﾑ(GIS)ﾌｫｰﾏｯﾄに対するｵﾌﾟｼｮﾝを編集するためにこのﾀﾞｲｱﾛｸﾞを使用します。

このﾀﾞｲｱﾛｸﾞにｱｸｾｽするには､

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。

ｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが開きます。

2.	GISﾀﾌﾞでｵﾌﾟｼｮﾝをｸﾘｯｸします。

ﾉｰﾄ：このﾀﾞｲｱﾛｸﾞで利用できるｵﾌﾟｼｮﾝは､選んだｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄに左右されます。こういった設定は該当ﾌｫｰﾏｯﾄの項目で説明されています。

ArcViewﾌｧｲﾙ(*.dbf､*.shp､*.shx)

属性を持つAutoCADﾌｧｲﾙ(*.dxf)

MapInfoﾌｧｲﾙ(*.mif,*.mid)

Microstationﾌｧｲﾙ(*.dgn)

ﾌｫｰﾏｯﾄに左右される設定以外の､すべてのﾌｫｰﾏｯﾄに共通な設定が以下に説明されています。

ﾌｧｲﾙﾌｫｰﾏｯﾄ

3つの異なるﾌｧｲﾙﾌｫｰﾏｯﾄがあります。

DOSﾌｫｰﾏｯﾄ

ﾀｰｹﾞｯﾄｼｽﾃﾑがMS-DOSで実行されているか､MS-DOS ASCII文字ｾｯﾄのﾃｷｽﾄを含む場合にはこのｵﾌﾟｼｮﾝを選択します。このﾌｫｰﾏｯﾄのﾃｷｽﾄﾌｧｲﾙは<CarriageReturn><NewLine>ﾚｺｰﾄﾞﾀｰﾐﾈｰﾀｰを持ちます。

Windowsﾌｫｰﾏｯﾄ

ﾀｰｹﾞｯﾄｼｽﾃﾑがMicrosoft Windowsｵﾍﾟﾚｰﾃｨﾝｸﾞｼｽﾃﾑで実行されているか､ASCII文字ｾｯﾄのﾃｷｽﾄを含む場合にはこのｵﾌﾟｼｮﾝを選択します。このﾌｫｰﾏｯﾄのﾃｷｽﾄﾌｧｲﾙは<CarriageReturn><NewLine>ﾚｺｰﾄﾞﾀｰﾐﾈｰﾀｰを持ちます。

UNIXﾌｫｰﾏｯﾄ

ﾀｰｹﾞｯﾄｼｽﾃﾑがUNIXｵﾍﾟﾚｰﾃｨﾝｸﾞｼｽﾃﾑで実行されている場合にはこのｵﾌﾟｼｮﾝを選択します。このﾌｫｰﾏｯﾄのﾃｷｽﾄﾌｧｲﾙは<NewLine>ﾚｺｰﾄﾞﾀｰﾐﾈｰﾀｰを持ちます。

ﾉｰﾄ：選択されたGISﾌｫｰﾏｯﾄに対して有効なﾌｧｲﾙﾌｫｰﾏｯﾄのみを利用できます。

寸法

GISﾌｫｰﾏｯﾄが3次元(3D)ﾎﾟｲﾝﾄをｻﾎﾟｰﾄする場合､2次元(2D)ﾎﾟｲﾝﾄ(北距と東距)と3次元(3D)ﾎﾟｲﾝﾄ(北距と東距､標高)をｴｸｽﾎﾟｰﾄできます。GISﾌｫｰﾏｯﾄが3Dﾎﾟｲﾝﾄをｻﾎﾟｰﾄしない場合には､このｵﾌﾟｼｮﾝの利用はできません。

ﾋﾝﾄ:GISが3Dﾎﾟｲﾝﾄをｻﾎﾟｰﾄしない場合に､標高をｴｸｽﾎﾟｰﾄするには属性をｸﾘｯｸしてﾎﾟｲﾝﾄ標高ｵﾌﾟｼｮﾝを選択します。

属性

ﾎﾟｲﾝﾄと一緒にｴｸｽﾎﾟｰﾄしたい生成された属性を選択するためには､属性をｸﾘｯｸします。属性ﾀﾞｲｱﾛｸﾞが開きます。このﾀﾞｲｱﾛｸﾞを使用して､ﾒﾆｭｰ属性値のｴｸｽﾎﾟｰﾄ方法を構成します。

ﾉｰﾄ：属性ﾀﾞｲｱﾛｸﾞで利用できるｵﾌﾟｼｮﾝは､すべてのGISﾌｫｰﾏｯﾄにおいて同一です。


属性ﾀﾞｲｱﾛｸﾞ（GISｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝ）

このﾀﾞｲｱﾛｸﾞを使用して､Trimble Geomatics Office がﾌｧｲﾙｴｸｽﾎﾟｰﾄと共に含むべきその他の属性値を選択します。属性は､ﾎﾟｲﾝﾄと一緒にﾃﾞｰﾀﾍﾞｰｽに保管されている該当値を使用して作成されます。このﾀﾞｲｱﾛｸﾞでは追加目的で自分用の属性を作成することはできません。

属性ﾀﾞｲｱﾛｸﾞで有効なｵﾌﾟｼｮﾝは､すべての地理的情報ｼｽﾃﾑ（GIS）ﾌｫｰﾏｯﾄにおいて同一です。

生成された属性

ｴｸｽﾎﾟｰﾄされる各ﾎﾟｲﾝﾄに追加されるために､こういったｵﾌﾟｼｮﾝの組み合わせを選択します。これは2D GISにｴｸｽﾎﾟｰﾄするのに標高もｴｸｽﾎﾟｰﾄしたい時に便利です。ｴｸｽﾎﾟｰﾄ先のGISｿﾌﾄｳｪｱでは､生成された属性のすべては普通の属性として表示されます。

ﾉｰﾄ：生成された日付と時間属性は､特徴･属性ﾗｲﾌﾞﾗﾘで最近使用されたﾌｫｰﾏｯﾄでｴｸｽﾎﾟｰﾄされます。

ﾒﾆｭｰ属性に名前を付けてｴｸｽﾎﾟｰﾄ

特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙやﾃﾞｰﾀ辞書(*.ddf)ﾌｧｲﾙが定義される時､各ﾒﾆｭｰ属性品目に対して2つ以内のｺｰﾄﾞ値を特定することができます。

ここではﾒﾆｭｰ属性｢ﾀｲﾌﾟ｣を持つ特徴ｺｰﾄﾞ｢木｣を例に挙げます。各ﾒﾆｭｰ品目はｺｰﾄﾞ値を持つことができます。ﾀｲﾌﾟ｢原生｣はNVとNTのｺｰﾄﾞ値を持つことができます。収集された属性を伴う｢木｣特徴ｺｰﾄﾞを持つﾎﾟｲﾝﾄは､実際の属性値（例､｢原生｣）としてか｢ﾕｰｻﾞｰｺｰﾄﾞ1｣（例､｢NV｣）として､または｢ﾕｰｻﾞｰｺｰﾄﾞ2｣（例､｢NT｣）としてそのﾀｲﾌﾟ属性をｴｸｽﾎﾟｰﾄすることができます。手持ちのGISが二文字属性値のみをｻﾎﾟｰﾄする場合にはこれが便利です。

ｺｰﾄﾞ値に関する詳細は､Trimble Feature and Attribute Editorﾕｰﾃｨﾘﾃｨのﾍﾙﾌﾟを参照してください。


｢ﾍﾙﾌﾟﾄﾋﾟｯｸｽ｣ｺﾏﾝﾄﾞ

｢ﾍﾙﾌﾟﾄﾋﾟｯｸｽ｣ｺﾏﾝﾄﾞを使用して､ｵﾝﾗｲﾝﾍﾙﾌﾟを開きます。


｢ﾋﾝﾄ｣ｺﾏﾝﾄﾞ

ﾋﾝﾄｼｽﾃﾑは､Trimble Geomatics Officeｿﾌﾄｳｪｱの使用に関するﾋﾝﾄを提供してくれます。

このｺﾏﾝﾄﾞを選択して､次のﾋﾝﾄを表示します。

Trimble Geomatics Officeｿﾌﾄｳｪｱをｽﾀｰﾄする時にﾋﾝﾄを表示するには､｢ｽﾀｰﾄ時にﾋﾝﾄを表示｣ﾁｪｯｸﾎﾞｯｸｽを選択します。


｢ﾋﾝﾄ｣ﾀﾞｲｱﾛｸﾞ

ﾋﾝﾄｼｽﾃﾑは､Trimble Geomatics Officeｿﾌﾄｳｪｱの使用に関するﾋﾝﾄを提供してくれます。

Trimble Geomatics Officeｿﾌﾄｳｪｱをｽﾀｰﾄする時にﾋﾝﾄを表示するには､｢ｽﾀｰﾄ時にﾋﾝﾄを表示｣ﾁｪｯｸﾎﾞｯｸｽを選択します。


｢Trimble Geomatics Officeに関して｣ｺﾏﾝﾄﾞ

ご利用方法

このｺﾏﾝﾄﾞを使用して､Trimble Geomatics Officeｿﾌﾄｳｪｱに対するﾌﾟﾛｸﾞﾗﾑや著作権情報､ﾊﾞｰｼﾞｮﾝ番号を表示します。


｢Trimble Geomatics Officeに関して｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞは､Trimble Geomatics Officeｿﾌﾄｳｪｱに対するﾌﾟﾛｸﾞﾗﾑや著作権情報､ﾊﾞｰｼﾞｮﾝ番号を表示します。


ﾍﾙﾌﾟの利用

Trimble Geomatics Officeｿﾌﾄｳｪｱの使用中に､ﾍﾙﾌﾟを利用するには以下のような方法があります。

ﾀﾞｲｱﾛｸﾞ内でﾍﾙﾌﾟを利用する	ﾀﾞｲｱﾛｸﾞがｱｸﾃｨﾌﾞであることを確認してから､F1を押します。
ﾒﾆｭｰｺﾏﾝﾄﾞでﾍﾙﾌﾟを利用する	1. ﾒﾆｭｰｺﾏﾝﾄﾞの上にｶｰｿﾙを置き､左のﾏｳｽﾎﾞﾀﾝを押したままにします。 2. F1を押します。.
目次を使用してﾍﾙﾌﾟｼｽﾃﾑでﾄﾋﾟｯｸを探す	目次ﾀﾌﾞを選択して､本のようにｶﾃｺﾞﾘｰ別にﾄﾋﾟｯｸを検索します。
ｷｰﾜｰﾄﾞを使用してﾍﾙﾌﾟｼｽﾃﾑでﾄﾋﾟｯｸを探す	ｷｰﾜｰﾄﾞﾀﾌﾞを選択して､ｷｰﾜｰﾄﾞｴﾝﾄﾘの一覧を見ます。探している言葉を自分で入力するか､一覧から探します。
ﾍﾙﾌﾟｼｽﾃﾑで用語や語句を検索する	1. 検索ﾀﾌﾞを選択します。 2. ｢検索設定｣ｳｨｻﾞｰﾄﾞが現れるかもしれません。現れた場合には､｢ﾃﾞｰﾀﾍﾞｰｽｻｲｽﾞを最小にする｣ｵﾌﾟｼｮﾝを選択して､｢次へ>｣､そして｢終了｣をｸﾘｯｸします。 3. ｢検索したい言葉を入力してください｣ﾌｨｰﾙﾄﾞに検索したい言葉か語句を入力します。 4. 必要に応じて､｢検索幅を狭めるために一致する言葉を選択｣ﾌｨｰﾙﾄﾞに､検索幅を狭めるための言葉を選択します。 5. ｢表示するﾄﾋﾟｯｸの選択｣ﾌｨｰﾙﾄﾞで､ﾄﾋﾟｯｸを選択します。ﾍﾙﾌﾟｳｨﾝﾄﾞｳの右側に表示されます。 ﾋﾝﾄ:ｷｰﾜｰﾄﾞを再建するには､検索/ｵﾌﾟｼｮﾝを選択します。
ﾍﾙﾌﾟﾄﾋﾟｯｸの印刷	現在のﾍﾙﾌﾟﾄﾋﾟｯｸを印刷するには､以下の1つを行います。 印刷をｸﾘｯｸします。 ﾌｧｲﾙﾒﾆｭｰから印刷ﾄﾋﾟｯｸを選びます。 ﾍﾙﾌﾟｳｨﾝﾄﾞｳの中で右ｸﾘｯｸして､印刷ﾄﾋﾟｯｸを選びます。 注:個々のﾍﾙﾌﾟﾄﾋﾟｯｸを印刷することはできますが､ﾍﾙﾌﾟﾌﾞｯｸは印刷できません。 ﾎﾟｯﾌﾟｱｯﾌﾟｳｨﾝﾄﾞｳで情報を印刷するには､その中を右ｸﾘｯｸしてから印刷ﾄﾋﾟｯｸをｸﾘｯｸします。

ﾋﾝﾄ: ﾍﾙﾌﾟﾂｰﾙﾊﾞｰで戻るをｸﾘｯｸすると､前に見たﾄﾋﾟｯｸを表示することができます。


インポート －概要
インポート−概要

詳細情報

利用方法...	ダイアログﾞ	関連項目
概要

いろいろなファイルフォーマットのデータをTrimble Geomatics Office のプロジェクトへインポートすることが可能です。例えば，基準点のファイル，GPS 生ファイル(*.dat)，Survey Controller ファイル(*.dc)，カスタムフォーマットです。

サポートされているインポートフォーマットに関する説明は，トピックのインポートダイアログをご覧ください。

データは以下からインポートできます。

Trimble Survey Controller が動作している装置

Trimble GPS 受信機

コンピュータ上のファイル

トータルステーション

デジタルレベル

ファイルがインポートされると，ファイルにあるポイントはデータベースに追加されます。既にデータベースにあるポイントと同じ名前のポイントがインポートされた場合，ポイントを結合する方法は重複ポイントオプションダイアログでのオプション設定に依存します。

ファイルをインポートしたときに何が起きるかはファイルタイプに依存します。しかし，すべてのファイルタイプにおいて再計算が自動的に実行され，インポートレポート(<Iインポートファイル名>.html という名前)が作成され，プロジェクトのReports フォルダに保存されます。

ファイルからインポートされたすべてのエンティティは必ず選択セットに保存されます。.dc ファイルの場合，選択セットの名前はファイルに書き込まれているジョブ名になります。他のファイルタイプの場合，選択セットの名前はインポートファイルの名前になります。選択セットを管理するには選択/選択セットコマンドを使用してください。

ヒント：ある選択セットのデータのみを表示するには，表示フィルターダイアログで選択セットのデータのみ表示オプションを使用します。

ヒント：インポート操作を取り消すには，元に戻すコマンドを使用します。インポート後にプロジェクトを閉じた場合には，ポイント選択ダイアログ/全般タブで検索ソースオプションを使用し，インポート操作を取り消す選択肢を削除します。

ノート：1つのファイルを2度以上，同じプロジェクトにインポートした場合，ファイル名の後ろにダッシュと番号を追加して適切なフォルダにコピーされます。例えば，MyGPSFile という名前のTrimble GPS 生データファイル(.dat )を2度インポートした場合，(最初のファイルインポート時に)MyGPSFile という名前のフォルダが作成されます。このフォルダにはMyGPSFile.dat とMyGPSFile-1.dat があります。重複データはインポート時に確認され，データベースには追加されません。


インポートダイアログ

このダイアログを使用してデータをプロジェクトにインポートします。

このダイアログを呼び出すには，次の1つを行ないます。

ファイル/インポートを選択する。

標準ツールバーのインポートボタン [image] をクリックする。

インポートフォーマットは3つのタブから構成されます。

測量

CAD/ASCII

カスタム

新しいフォーマット

このボタンはカスタムタブが選択されている場合に使用可能になります。

新しいカスタムフォーマットを作成するには，新しいフォーマットをクリックします。

ASCII インポートフォーマット定義ダイアログが表示されます。

このダイアログを使用してインポートフォーマットを定義します。

フォーマット編集

このボタンはカスタムタブが選択されている場合に使用可能になります。

フォーマット編集をクリックして既存のASCII インポートフォーマットを編集します。

ASCII インポートフォーマット定義ダイアログが表示されます。

このダイアログを使用してインポートフォーマットを編集します。

フォーマット削除

このボタンはカスタムタブが選択されている場合に使用可能になります。

フォーマット削除をクリックしてカスタムインポートフォーマットを削除します。確認の画面が表示されます。

削除するにははいをクリックします。

カスタマイズ

カスタマイズボタンを使用して、インポートダイアログに表示されるインポートオプションの一覧を選択します。チェックリストから必要なインポートオプションを選択します｡

カスタマイズダイアログから外部フィルターを追加できます。外部フィルターは、Trimble Geomatics Office と統合するために書き込みのできる別のプログラムです。Trimble Geomatics Office 内で使用されるために書き込まれた外部フィルターすべては、システムに追加される場合にはそれに対する必要条件に適合しなければなりません。インポートダイアログで選択されたタブに対する現在インストールされているフィックスモードだけが現れます｡

どんなフィルタープログラムもDynamically Linked Library (*.dll)ファイルとして、エクスポートされた特別な機能と一緒にコンパイルしなければならず、かつCOM (Component Object Module)オブジェクトとして作成されなければなりません。

適切なファイルが選択されると、Trimble Geomatics Office はフィルターCOM オブジェクトをコンピュータに登録し、.dll インターフェースがシステムの必要条件に適合するかを確認します。これに失敗した場合には、システムはフィルターを登録できないことを報告します。フィルターがインストールされた場合には、フィルターの短い説明がダイアログ内の一覧に含まれるようになります。

更に詳しい情報には、外部インポート/エクスポートフィルターを参照してください。

オプション

インポートされたファイルに対して、オプションボタンをクリックすることで以下のことができます。

インポート時に重複ポイントをどのように扱うかを指定

インポートデータの質を設定

インポートされたデータの単位を指定

インポートされたファイルの設定を指定

装置（3300/3600/5600 Elta M5 か3600/5600 GDM）にデータをインポートする時のオプションを変更

プロジェクトに対して使用された座標系とは異なる座標系を選択する場合には、Trimble Geomatics Office はファイルを読み込み、座標をプロジェクト座標系に変換し、ポイントを保存して、プロジェクト座標系にそれらを表示します。データファイルは変更されません。

ノート：データファイルからインポートされたポイントに対してTrimble Geomatics Officeで表示される座標値は、ファイル内の座標とは異なる可能性があります。


インポートフォーマット －測量タブ
インポートフォーマット−測量タブ

概要と詳細

測量タブを使用してTrimble Survey ControllerやTrimble GPS 受信機、Trimble 3600/5600 GDM 機器、トータルステーション、デジタルレベル、コンピュータ上の測量データファイルからデータをインポートします。

インポート/測量タブを呼び出すには、

1.	ファイル/インポートを選択します。

2.	測量タブを選択します。

カスタムフォーマットをこのタブに移動することができます。詳細についてはAsciiimp.dat ファイルをご覧ください。

ノート：同様にドラッグ・アンド・ドロップを使用してファイルをインポートすることもできます。

測量タブを使用して次のフォーマットをインポートします。

フォーマット	このフォーマットを使用して インポートするのは�
デジタルレベルファイル(*.dat,*.raw)	デジタルレベルのファイル。
GPS データファイル(*.dat)	コンピュータからのTrimble GPS .dat ファイル。
グリッド DTM ファイル(*.dtx)	DTMLink ソフトウェアで作成されたグリッドに区切られたデジタル地形モデル。
NGS データシートファイル(*.dat,*.dsx,*.htm,*.html)	National Geodetic Survey (NGS)標準フォーマットデータファイル。
Trimble データ交換(Data Exchange )フォーマット	Trimble Data Exchange フォーマットのデータのあるASCII ファイル。 このフォーマットは主に測量データを他のソフトウェアパッケージに転送するのに使用されます。
精密暦(*.sp3,*.e18)	基線解析に使用する精密暦フォーマットファイル。このファイルはCommon Files に保存されます。選択するには，GPS 解析スタイルダイアログを使用します。
RINEX ファイル(*.Xxo,*.XXn,*.obs,*.nav)	Receiver Independent Exchange フォーマットファイル。このフォーマットにより，すべてのGPS受信機メーカーのGPS 生データファイルを転送できます。航法ファイルと観測ファイルの両方が同じディレクトリに必要です。
Sokkia データレコーダファイル(*.sdr)	コンピュータからSokkia Data Recorder フォーマットファイル。
SSF/SSK ファイル(*.ssf,*.ssk)	Trimble GPSurvey ソフトウェアで作成された後処理キネマティック解のファイル，または後処理静止解のファイル
Survey Controller ファイル(*.dc)	コンピュータからのTrimble Survey Controllerフォーマットファイル。 .dc ファイルをインポートする時、すべてのGPS ベクトルと観測は、関連するアンテナや機器、プリズム高と一緒にプロジェクトに保存されます。これらのデータは計算に使用されます。
測量装置	サポートされているトータルステーションや装置、測量データカード（Survey Data card）、GPS受信機から直接のデータ。
サードパーティーデータレコーダーファイル	外部インポート/エクスポートフィルターを使用して提供されたサードパーティのデータレコーダファイル。 Trimble Geomatics Office には次のサードパーティのフォーマットが用意されています。 Leica GS1-16 SDMS (座標ポイントをインポート) Nikon AP-700 ASCII データ Topcon GTS-700 とFC-5 フォーマットデータ
Trimble 3600/5600 GDM ファイル(*.job,*.are)	Trimble 3600/5600 GDM データファイル
TDS Survey Pro CE ジョブファイル(*.job)	TDS Survey Pro CE ジョブファイルのインポート
TDS Survey Pro CE 生ファイル(*.raw)	TDS Survey Pro CE 生ファイルのインポート
Trimble 3300 /3600 /5600 Elta M5 ファイル(*.dat)	3300 /3600 /5600 Elta M5 ファイルのインポート
Trimble 3600 /5600 TDS 座標ファイル(*.cr5)	Trimble 3600 /5600 TDS 座標ファイルのインポート
Trimble 3600 /5600 TDS 生ファイル(*.rw5)	Trimble 3600 /5600 TDS 生ファイルのインポート
Trimble Elta GPS Controller M5 ファイル(*dat)	Trimble Elta GPS Controller M5 ファイルのインポート


NGS データシートファイル(*.dat,*.dsx,*.htm,*.html)オプション

National Geodetic Survey (NGS)標準フォーマットのデータファイルをインポートできます。

Trimble Geomatics Office はプロジェクトにインポートされるすべてのNGS データをNAD-83 測地系(つまり，WGS-84 測地系と同等)と仮定します。

NGS データをNAD-83 測地系を基本にしているかよくわからないプロジェクトにインポートする場合，Trimble Geomatics Office はNGS データが適当かどうか確証できません。

ノート：Trimble Geomatics Office はNAD-83 測地系を名前で認識します(つまり，NAD-83 で始まるすべての測地系)。

測地系がNAD-83 と等しくない場合，次の警告メッセージが表示されます。

プロジェクトはNAD 1983 測地系ではないようです。 これはNAD 1983測地系のデータをインポートするときに問題を引き起しプロジェクトの測地系への変換も行われません.

インポートを続けますか?

警告：インポートを続ける，と選択した場合，プロジェクトにどんな測地系が定義されていたとしてもNGS 座標は変換されます。この測地系がNAD-83 と同等でない場合，この変換は正しくありません。


CAD/ASCII インポートフォーマット

インポート/CAD/ASCII タブを呼び出すには、

1.	ファイル/インポートを選択します。

2.	CAD/ASCII タブを選択します。

ノート：ASCII ファイルを扱うすべてのインポートフォーマットは常に標準型の数値データを受け取ることを想定しています。標準型には1000毎のカンマはありません。小数点はあります。

カスタムフォーマットをこのタブに移動することができます。詳細についてはAsciiimp.dat ファイルをご覧ください。

ノート：同様にドラッグ・アンド・ドロップを使用してファイルをインポートすることもできます。

CAD/ASCII タブを使用して次のフォーマットをインポートします。

フォーマット	このフォーマットを使用してインポートするのは�
AutoCAD ファイル(*.dwg,*.dxf)	ASCII およびバイナリの.dxf および.dwg ファイル(.dxf リリース 14 まで)を使用して座標のあるポイントとライン等。
C &G 標準フォーマット	C &G ソフトウェアの標準ASCII ファイル。
C &G 引用なし	C &G ソフトウェアの引用のないASCII ファイル。
CMM COR and LEV ファイル(*.cor,*.lev)	Land Management のBureaux を使用した標準ASCII フォーマット。 CMM COR and LEV ファイルオプションは外部インポートフィルターを使用して用意されています。
NMEA ファイル	NMEA フォーマットファイル(GGA,GGK,PJK 文字列)からポイント。 NMEA はthe National Marine Electronics Association(全国海洋電子機器協会)によって開発された標準で，海洋ナビゲーション機器間の通信データフォーマットを定義します。
Pacsoft フォーマット	Pacsoft ソフトウェアの標準ASCII ファイル。
SDRmap 座標	SDRmap 座標テキストファイル。
TPLANE (LLHE)	Trimble GPSurvey ASCII ファイル。
TRIMMAP グラフィックファイル(*.tgf)	TRIMMAP (またはSDRmap )*.tgf グラフィックファイル。
WILDsoft フォーマット	WILDsoft ソフトウェアの標準ASCII ファイル。
Terramodel プロジェクトファイル(*.pro)	Terramodel プロジェクトファイルからのポイント、ラインワーク、レイヤー


カスタムインポートフォーマット

インポート/カスタムタブを呼び出すには、

1.	ファイル/インポートを選択します。

2.	カスタムタブを選択します。

ノート：あるいはドラッグ・アンド・ドロップを使用してファイルをインポートします。

カスタムフォーマットを他のタブに移動することができます。詳細についてはAsciiimp.dat ファイルをご覧ください。

カスタムタブを使用して以下を行ないます。

カスタムフォーマットのデータファイルをインポートする

新しいカスタムインポートフォーマットを追加する

既存のカスタムインポートフォーマットを編集する

カスタムインポートフォーマットを削除する

下のカスタムフォーマットがあらかじめ用意されています。

カンマ区切りポイント

固定長ポイント

名前，東距，北距，標高，コード

名前，緯度，経度，高度，コード(ローカル)

名前，緯度，経度，高度，コード(WGS-84 )

名前，北距，東距，標高，コード

ASCII ファイルから値をインポートする場合，Trimble Geomatics Office はMicrosoft Windows のコントロールパネル/地域のオプション/数値タブで定義された桁区切り記号や小数点記号を使用している値を読み込むことができます。また，標準型の値も読み込みます。標準型とは，桁区切り記号(1000毎の区切り)がなく，小数点はある値です。

すべてのカスタムインポートフォーマットはAsciiimp.dat ファイルに書き込まれます。


ASCII インポートフォーマット定義ダイアログ

概要と詳細

このダイアログを使用してASCII インポートフォーマットを定義します。

このダイアログを呼び出すには、

1.	ファイル/インポートを選択します。インポートダイアログが表示されます。

2.	カスタムタブで，次の1つを行ないます。

新しいフォーマットを作成するため新しいフォーマットをクリックします。

既存フォーマットを編集するためフォーマット編集をクリックします。

名前

インポートフォーマットの名前を入力，または編集します。この名前はインポートダイアログのカスタムタブのタイプリストに表示されます。重複する名前は入力できません。

空白文字列

インポートフォーマット定義に空白文字列を入力します。このフィールドはオプションです。ファイルのインポート中，ここで指定した空白文字列は，特定のレコードに使用できる値がないことを示している，と解釈されます。

Trimble Geomatics Office が指定された空白文字列を発見した場合，データはデータベースに追加されますが，該当のデータベースフィールドには値を割り当てません。

ノート：ファイルタイプによっては�99999.99�，�*****�，あるいは類似の特殊な文字列が必要かもしれません。設定を特定することにより，Trimble Geomatics Office で自分の好みの設定を使用することができます。

説明

インポートフォーマットの説明を入力します。説明はインポートダイアログでフォーマットがハイライトされた時，ステータスバーに表示されます。このフィールドはオプションです。

標準拡張子

インポートフォーマットの標準拡張子を入力します。例えば，.dat または.fbk。このフィールドはオプションで，省略された場合，�.txt�となります。

ヒント：すべてのファイル拡張子を受け入れる場合，???を入力してください。

ノート：Trimble Geomatics Office は開くダイアログのタイプフィールドのリストファイルで拡張子を使用します。これにより，指定した拡張子を持つファイルの名前を名前リストに表示します。Trimble Geomatics Office は名前と拡張子の間にピリオドがあると自動的に仮定します。

インポート

インポートされるファイルのデータとして適切なレコードタイプを選択します。これは通常，ポイント情報です。

フォーマットを自動的に設定

フォーマットを自動的に設定をクリックするとフォーマット挿入ダイアログが開きます。このダイアログを使用してヘッダーと本文のフォーマット定義を自動的に初期化します。詳細についてはフォーマットを自動的に設定をご覧ください。

ヘッダーフォーマット

ショートカットメニューから利用できるフィールドコードを使用して，インポートファイルのはじめの固定部分に合うように，またはスキップするように定義を設定することができます。ヘッダー定義はTrimble Geomatics Office によってファイルの最初で1度だけ，使用されます。インポートファイルのヘッダーラインが定義と合わなかった場合，ファイルの読み込みは停止します。これはファイルフォーマットを確認するのに便利です。

ノート：ヘッダー定義に空白のラインを追加するにはCtrl+Enterを押してください。

例えば，フィールドコード[$Skip.Line:7]から成るヘッダー定義は，Trimble Geomatics Office にファイルの最初の7行をスキップしてファイルの残りの部分を本文フォーマットの定義に従って読み込むよう指示します。

本文フォーマット

ショートカットメニューから利用できるフィールドコードを使用して，読み込むファイルのデータに合う定義を作成することができます。1つのエンティティに関わるデータが複数行に渡って定義された場合，定義ではCtrl+Enterを押して新しい定義ラインを追加した，とみなされます。

使用できるすべてのフィールドコードに関する詳細はフィールドコード−概要をご覧ください。

ファイルがインポートされる時、Trimble Geomatics Office は定義のフィールドコードに読み込まれたラインを繰り返し変換しようとします。インポートファイルが定義に合わない場合，不適合が発生したことがインポートレポートに記録され，その後，プログラムは定義に合うデータが他にファイルにないか検索します。

ノート：Trimble Geomatics Office はヘッダー定義の後，自動的に本文フォーマット定義を新しいラインで始めます。

フッターフォーマット

ショートカットメニューから利用できるフィールドコードを使用してインポートファイルの最後の固定部分に合うように，またはスキップするように定義を作成することができます。

フッター定義はTrimble Geomatics Office によってファイルの最後で1度だけ，使用されます。インポートファイルのフッターラインが定義と合わなかった場合，ファイルの読み込みは停止します。これはファイルフォーマットを確認するのに便利です。

ノート：フッター定義に空行を追加するにはCtrl+Enterを押してください。

Trimble Geomatics Office は本文定義の後，自動的にフッターフォーマット定義を新しいラインで始めます。

カスタムASCII インポートの例はカスタムASCII インポートフォーマット�用例をご覧ください。


カスタムASCII インポートフォーマット－用例

関連項目

これらの用例はASCII インポートフォーマットをどのように定義するかを説明します。

用例 1

次のラインのあるファイルを読み込みます。

File Format Version 1.00

Date:8/11/99

Project:Example

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,TREE

1026,534222.218,263095.934,10.136,TREE

1027,534224.816,263092.579,10.140,POLE

1028,534228.398,263089.101,10.732,FENCE

1041,534236.948,263084.989,11.054,FENCE

1042,534237.326,263087.964,10.982,FENCE

1087,534243.575,263099.773,10.154,MH

ヘッダーフォーマットは次のように定義します。

File Format Version 1.00	ファイルの最初のラインを確認します
[$Skip.Line:2]	次の2行は内容を定義しないのでスキップします

本文フォーマットは次のように定義します。

[名前]，[東距]，[北距]，[標高]，[特徴コード]

用例2

次のラインのあるファイルを読み込みます。

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 TREE

1026  534222.218  263095.934      10.136 TREE

1027  534224.816  263092.579      10.140 POLE

1028  534228.398  263089.101      10.732 FENCE

1041  534236.948  263084.989      11.054 FENCE

1042  534237.326  263087.964      10.982 FENCE

1087  534243.575  263099.773      10.154 MH

ヘッダーフォーマットは定義しません。

本文フォーマットは次のように定義します。

[名前:4][東距:12.3][北距:12.3][標高:12.3][特徴コード]


フォーマットを自動的に設定/フォーマット挿入ダイアログ

フォーマットを自動的に設定をクリックするとユーザ定義されたインポートフォーマットまたはエクスポートフォーマット，またはデータベースレポートの本文定義が自動的に初期化されます。ボタンをクリックすると，フォーマット挿入ダイアログが表示されます。

ノート：このボタンは次のダイアログで表示されます。

ファイル/インポート/ASCII インポートフォーマット定義ダイアログ

ファイル/エクスポート/ASCII エクスポートフォーマット定義ダイアログ

レポート/追加レポート/レポートフォーマット定義ダイアログ

Trimble Geomatics Office は，関係するすべてのデータのフィールドコードの標準セットを作成します。この初期標準値を使用して新しいフォーマットの基本とし，必要に応じて定義を変更することができます。

レイアウト

レイアウトグループはレポートや定義のフォーマットをコントロールします。

ノート：1度レポートを作成したら，以降，HTML エディターを使用して編集することができます。

固定長

固定長オプションを選択すると各フィールドに定義の標準固定長を割り当てます。

ノート：インポート定義またはエクスポート定義の場合，このオプションを使用しても標準ヘッダー情報は作成されません。

文字区切り

文字区切りオプションを選択してフィールドに入力します。このオプションでは，レポートや定義のフィールド間に使用される区切り文字を設定します。

ノート：このオプションを使用する場合，標準ヘッダー情報が必ず作成されます。

フィールド区切り文字

フィールド区切り文字フィールドでレポートや定義のフィールド間に挿入される文字を指定します。

ヒント：フィールドには標準値がセットされていますが，フィールドに入れたいどんな文字でも入力することができます。

テキスト区切り文字

テキスト区切り文字フィールドでレポートや定義の各テキストフィールドの前と後ろに追加する文字を指定します。

ヒント：フィールドには標準値がセットされていますが，フィールドに入れたいどんな文字でも入力することができます。


エクスポート－概要

利用方法	ダイアログ	関連項目

他のフォーマットでデータが必要な場合，プロジェクトからデータをエクスポートします。例えば，データを他のソフトウェアパッケージで使用したいとか，ファイルをTrimble Survey Controller に送信したいといった場合です。

Trimble Geomatics Office のプロジェクトからデータをいろいろなフォーマットにエクスポートできます。例えば，次のものにデータをエクスポートできます。

Trimble Survey Controller  (現場の作業を行うのにファイルが必要な場合，例えば特徴･属性ライブラリ)

各種のASCII フォーマット(他のフォーマットでデータが必要な場合，例えば)

各種の一般的GIS フォーマット

カスタムフォーマット(およびカスタムフォーマット定義)

サポートされているエクスポートフォーマットに関する説明はエクスポートダイアログをご覧ください。


エクスポートダイアログ

このダイアログを使用してプロジェクトからデータをエクスポートします。

このダイアログを呼び出すには，次の1つを行ないます。

ファイル/エクスポートを選択します。

エクスポートツール [image] を選択します。

ノート：ASCII ファイルを出力するすべてのエクスポートフォーマットは常に標準形式(1000毎のカンマ区切りはなく，小数点はある)の数値データを出力します。ASCII ファイル内のエクスポートされたデータは、Trimble Geomatics Office が表示のために使用する単位で表示されます。しかし、エクスポートデータの単位一覧で、エクスポート用に別の単位を指定することもできます。または、ファイル/プロジェクトプロパティを選択してから、そこで現れるプロジェクトプロパティダイアログで単位とフォーマットタブを選択することで、Trimble Geomatics Office 表示単位を変更します。

ステータスバーにエクスポートフォーマットの説明を表示するにはエクスポートフォーマットをハイライトします。エクスポートフォーマットは次のタブで構成されています。

測量

CAD/ASCII

GIS

カスタム

新しいフォーマット

新しいフォーマットボタンはカスタムタブがハイライトされている場合に使用可能になります。

新しいカスタムレポートフォーマットを作成するには新しいフォーマットをクリックしてから、ASCII エクスポートフォーマット定義ダイアログを使用します。

このダイアログを使用してエクスポートフォーマットを定義します。

フォーマット編集

フォーマット編集ボタンはカスタムタブをハイライトしている場合に使用可能になります。

既存のASCII エクスポートフォーマットを編集するには、フォーマット編集をクリックしてから、エクスポートフォーマットを修正するためにASCII エクスポートフォーマット定義ダイアログを使用します。カスタムフォーマット定義の詳細についてはASCII エクスポートフォーマット定義�用例トピックの用例をご覧ください。

フォーマット削除

フォーマット削除ボタンはカスタムタブがハイライトされている場合に使用可能になります。

カスタムエクスポートフォーマットを削除するにはフォーマット削除をクリックして、アクションを承認するか取消します。

カスタマイズ

カスタマイズボタンを使用して、エクスポートダイアログに表示されるエクスポートプションの一覧を選択します。チェックリストから必要なエクスポートプションを選択します｡

カスタマイズダイアログから外部フィルターを追加できます。外部フィルターは、Trimble Geomatics Office と統合するために書き込みのできる別のプログラムです。Trimble Geomatics Office 内で使用されるために書き込まれた外部フィルターすべては、システムに追加される場合にはそれに対する必要条件に適合しなければなりません。エクスポートダイアログで選択されたタブに対する現在インストールされているフィックスモードだけが現れます｡

どんなフィルタープログラムもDynamically Linked Library (*.dll)ファイルとして、エクスポートされた特別な機能と一緒にコンパイルしなければならず、かつCOM (Component Object Module)オブジェクトとして作成されなければなりません。

適切なファイルが選択されると、Trimble Geomatics Office はフィルターCOM オブジェクトをコンピュータに登録し、.dll インターフェースがシステムの必要条件に適合するかを確認します。これに失敗した場合には、システムはフィルターを登録できないことを報告します。フィルターがインストールされた場合には、フィルターの短い説明がダイアログ内の一覧に含まれるようになります。

更に詳しい情報には、外部インポート/エクスポートフィルターを参照してください。

オプション

エクスポートされたファイルに対して、オプションボタンをクリックすることで以下のことができます。

エクスポートされたデータの単位を指定

エクスポートされたファイルの設定を指定

エクスポートしようとしているデータファイルの座標系を変更

装置（3300/3600/5600 Elta M5 か3600/5600 GDM）にデータをエクスポートする時のオプションを変更

設定できないエクスポートフォーマットの場合，このボタンは使用できません。

エクスポートする特定のファイルについて詳細な設定を行うにはオプションをクリックします。例えばAutoCAD (*.dxf または*.dwg)フォーマットの場合，AutoCAD エクスポートオプション(.dwg,Ascii .dxf,バイナリ.dxf)やAutoCAD バージョンを選択したり，ドローイング見本を参照したりすることができます。

エクスポートデータの座標系

エクスポートするデータファイルの座標系を選択するにはオプションダイアログで変更をクリックします。このボタンは、現在反転表示されているフォーマットがそのファイル中に座標系定義を持たない場合に使用可能になります。プロジェクトで使用されている座標系とは異なる座標系を選択した場合には、Trimble Geomatics Office はエクスポートされるポイントの座標を選択された座標系へと変換し、エクスポートファイルを書き込み、選択された座標系のポイントを保存します。

ノート：Trimble Geomatics Office で表示されるポイントの座標値は、ファイルに書込まれたものとは異なる可能性があります。

エクスポート

選択ツールを使って現在選択しているものを選択した場合，選択されているデータをエクスポートするかデータベース全体をエクスポートするか選択することができます。

2つのオプションがあります。

選択	選択されているデータをエクスポートします
データベース全体	データベースのすべてのポイントをエクスポートします
何も選択していない場合，選択ボタンは使用できません。エクスポートはデータベース全体に適用されます。

データのソート

データをエクスポートする順番を選択できます。

1.	データのソートチェックボックスを選択します。

2.	リストからソート順を選択します。次から選択します。

データベース順	標高
名前	質
開始時刻	データタイプ
観測時間の長さ

ノート：同様のソートオプションがプロパティウィンドウで使用できます。

ヒント：自分自身のソートクエリを追加した場合，それはリストに追加されます。詳細についてはデータベースクエリー�概要トピックをご覧ください。


エクスポートフォーマット－測量タブ

概要と詳細

エクスポートダイアログの測量タブを使用して測量データをファイルまたは装置へエクスポートします。

このタブを呼び出すには、

1.	ファイル/エクスポートを選択します。

エクスポートダイアログが表示されます。

2.	測量タブを選択します。

カスタムフォーマットをこのタブへ移動することもできます。詳細についてはAsciiexp.dat ファイルをご覧ください

このタブには次のフォーマットがあります。

オプション	このオプションを使用してエクスポートするのは�
Survey Controller へアンテナ詳細	Trimble Survey Controllerへの新しいアンテナの詳細。 例えば，Trimble が新しいアンテナをリリースした場合，このエクスポートオプションを使用してアンテナの詳細をTrimble Survey Controllerへ転送します。
Trimble Survey Controller へ背景地図(*.dxf)	dxf ファイルをTrimble Survey Controller (バージョン10 以降)へ
Trimble Survey Controller へカンマ区切り座標ファイル(*.csv)	csv ファイルをTrimble Survey Controller (バージョン10 以降)へ
Survey Controller へデータ辞書(*.ddf)	データ辞書(.ddf)ファイルをTrimble Survey Controller が動作している装置へ。これを行うにはSurvey Controller 装置がセットアップされている必要があります。 データ辞書エディタユーティリティで.ddf ファイルを作成できます。このユーティリティはTrimble のGPS Pathfinder ソフトウェアの一部です。 ノート：.ddf ファイルはTrimble Survey Controller  バージョン7.00 にだけ転送できます。
Survey Controller へ測地グリッド(*.cdg)	Trimble Survey Controller (バージョン7.00以上)への測地グリッド。転送するグリッドファイルのサイズを減らすことができます(サブグリッド)。Trimble Survey Controller の以前のバージョンは測地グリッドをサポートしていません これを行うにはSurvey Controller 装置がセットアップされている必要があります。 ノート：現在のプロジェクトの座標系で使用されている測地グリッドのサブグリッドのみ，作成できます。しかし，結合した測地グリッドはどれでもエクスポートできます。
説明ファイルをTDS 装置へ(*.txt)	説明ファイル(*.txt)をTDS ソフトウェアを実行している装置へ。これを行うには、先ずTDS装置をセットアップする必要があります。説明ファイルをマニュアルで作成したり、特徴コードエディタユーティリティからそれをエクスポートしたりできます。
DTM ポイントをファイルへ(*.dtx)	Trimble Survey Controller と互換性のある、プロジェクト内で選択されたポイントのデジタル地形モデル(*.dtx)ファイル。
Survey Controller へDTM ポイント	Trimble Survey Controller へ直接エクスポートするよう選択されたポイントのTrimble Survey Controller と互換性のあるデジタル地形モデル(*.dtx)ファイル。 これを行うには，Survey Controller装置がセットアップされている必要があります。
特徴・属性ライブラリをSDR33 ファイルへ(*.sdr)	選択しているライブラリの特徴ごとにノートレコードがあるSDR33 ファイル。このオプションでは属性はエクスポートできません。
Survey Controller へ特徴・属性ライブラリ(*.fcl)	Trimble Survey Controller が動作しているデータコレクタへの特徴・属性ライブラリ。ファイルに属性が含まれる場合も含まれない場合もあります。(属性をエクスポートする場合，チェックボックスを選択してください)。 これを行うには，Survey Controller装置がセットアップされている必要があります。 特徴・属性ライブラリのほかの情報(例えば，ポイントスタイル)はTrimble Survey Controller へ転送されません。
特徴･属性ライブラリをTDS 装置へ(*.fcl)	選択した特徴・属性ライブラリを基礎とする説明ファイル(*.txt)をTDS ソフトウェアを実行している装置へ。これを行うには、先ずTDS装置をセットアップする必要があります。属性はTDSソフトウェアにエクスポートされません。
Survey Controller へジオイドファイル(*.ggf)	ジオイドグリッドファイルをTrimble Survey Controller (バージョン6以降)が動作している装置へ。作業する範囲を選択できます。これによって、Trimble Survey Controller へ転送するジオイドグリッドファイルのサイズは減少します。 これを行うには，Survey Controller装置がセットアップされている必要があります。 ノート：サブグリッドを作成するには，ジオイドモデルが定義されている座標系を使用している必要があります。現在使用しているジオイドグリッドファイルしかサブグリッド作成できませんが、どのジオイドファイルもエクスポートはできます。
ジオイドファイルをTDS Survey Pro へ(CE)	ジオイドグリッドファイルをTDS Survey Pro (CE)を実行している装置へ。 作業する範囲を選択できます。これによって、転送されるジオイドグリッドファイルのサイズは減少します。
NGS Bluebook ファイル	B，G，SERFIL ファイル。NGS Bluebook フォーマットは国家基準網に包括するためthe US National Geodetic Survey へGPS 基線を転送するために主に使用されます。
Pコードファイルを3600/5600 GDM へ(*pco)	Pコードファイルを3600/5600 GDM.へ
Trimble Data Exchange フォーマット	Trimble Geomatics Office のプロジェクトからの測量データ。このフォーマットを使用して測量データをTrimble Geomatics Office のプロジェクト間でコピーします。このフォーマットは、サードパーティの網平均ソフトウェアパッケージへデータをエクスポートするのに主に使用されます。フォーマットはTrimble が定義し，ステーションや座標、解析されたGPS ベクトル，一般測量機観測，レーザー観測，レベルと方位の情報を含むASCII ファイルを生成するために使用されます。このフォーマットをサポートしているかは、網平均ソフトウェアのベンダーに確認してください。
SDR ファイル(*.sdr)	現在のプロジェクトで使用している設定されたバージョンの.sdr ファイル。 オプションをクリックして、設定を変更します。
STAR*NET 2D コントロールポイント	STAR*NET 2D フォーマットの基準点。データベースで北距/東距の質が基準点のポイントだけがエクスポートされます。標高の質は何でもかまいません。 STAR*NET パッケージで作業する時，適当なテキストエディタを使用して基準点と観測ファイルを1つのファイルに結合するのが1番いいことに気づくでしょう。
STAR*NET 3D コントロールポイント	STAR*NET 3D フォーマットの基準点。データベースで北距/東距の質が基準点で標高の質も基準点のポイントだけがエクスポートされます。 STAR*NET パッケージで作業する時，適当なテキストエディタを使用して基準点と観測ファイルを1つのファイルに結合するのが1番いいことに気づくでしょう。
STAR*NET 観測	STAR*NET 観測フォーマットのプロジェクトデータベースのすべての一般測量機観測。 STAR*NET パッケージで作業する時，適当なテキストエディタを使用して基準点と観測ファイルを1つのファイルに結合するのが1番いいことに気づくでしょう。
測量機	サポートされているトータルステーション，データコレクタ，Survey Data card，GPS 受信機へ直接データ。
Survey Controller ファイル(*.dc)	現在のプロジェクトで使用している設定されたバージョンの.dc ファイル。 オプションをクリックして設定を変更します。
Trimble 3300 /3600 /5600 Elta M5 ファイル	Trimble 3300 /3600 /5600 Elta M5 ファイル
Trimble 3600/5600 GDM ファイル(*.are)	Trimble 3600/5600 GDM エリアファイル
Trimble Elta GPS Controller M5 ファイル(*.dat)	Trimble Elta GPS Controller M5 座標ファイル
TDS Survey Pro (CE)ジョブファイル(*.job)	ジョブファイルをTDS Survey Pro CE 装置へ
Trimble 3600/5600 TDS 座標ファイル(*.cr5)	座標ファイルをTrimble 3600/5600 TDS装置へ
Trimble Data Exchange Format ファイル(*.asc)	TDEF ファイル


CAD/ASCII エクスポートフォーマット

概要と詳細

CAD/ASCII  タブを使用していろいろなASCII およびCAD フォーマットにデータをエクスポートします。

エクスポート/CAD/ASCII  タブを呼び出すには、

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	CAD/ASCII  タブを選択します。

カスタムフォーマットをこのタブに移動することもできます。詳細についてはAsciiexp.dat ファイルをご覧ください。

ノート：ASCII ファイルを出力するすべてのエクスポートフォーマットは常に標準型(1000毎のカンマ区切りはなく，小数点はある)の数値データを出力します。ASCII ファイルに出力された値は，エクスポートデータリストの単位を使用して変更しない限り，システムで表示に使用している単位と同じ単位です。システムの表示単位を変更するには，ファイル/プロジェクトプロパティを選択してください。プロジェクトプロパティダイアログが開きます。単位とフォーマットを選択してください。

CAD/ASCII  タブには次のオプションがあります。

オプション	このオプションを使用してエクスポート するのは...
AutoCAD ファイル(*.dxf,*.dwg)	AutoCAD のdrawing exchange(dxf )またはdrawing(dwg )ファイル。 データフォーマット，バージョン，見本ドローイングを設定するにはオプションをクリックします。
C&G 標準フォーマット	C&G ソフトウェアの標準ASCII フォーマットファイル。
C&G 引用なし	C&G ソフトウェアの引用符のないASCII  フォーマットファイル。
CMM ファイル(*.cor,*.lev)	Land Management のBureaux で使用される標準ASCII フォーマットファイル。 CMM ファイル(*.cor,*.lev)オプションは外部エクスポートフィルタを使用して用意されています。
DC ファイル属性ノート(Survey Controller V4)	コロン(:)で区切られた値を伴う属性を持つTrimble Survey Controller  バージョン4 .dc ファイル。特徴・属性ライブラリを使用して収集された属性はこのフォーマットではエクスポートされません。
Pacsoft フォーマット	Pacsoft ASCII フォーマットファイル。
SDMS フォーマット	AASHTOのSurvey Data Management System フォーマットのデータ。
SDRmap 座標	SDRmap 座標ファイル。
Autodesk fieldbook ファイル(*.fbk)	Autodesk の'fieldbook'フォーマットのファイル
TERRAMODEL 鳳,N,E,Z,20D �ファイル(*.pts)	基本的な，カンマ区切りフォーマットのファイル。
TPLAN (LLHE)	Trimble GPSurvey のASCII フォーマットファイル。 このオプションではWGS-84 の緯度経度座標がエクスポートされます。
TRIMMAP グラフィックファイル(*.tgf)	TRIMMAP(またはSDRmap )グラフィックファイル。
WILDsoft フォーマット	WILDsoft ASCII フォーマットファイル。


エクスポートフォーマット－カスタムタブ

エクスポート/カスタムタブを呼び出すには、

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	カスタムタブを選択します。

カスタムフォーマットをこのタブへ移動することもできます。詳細についてはAsciiexp.dat ファイルをご覧ください。

カスタムタブを使用して次の操作を行ないます。

データファイルをカスタムフォーマットでエクスポートする

新しいカスタムエクスポートフォーマットを追加する

既存のカスタムエクスポートフォーマットを編集する

カスタムエクスポートフォーマットを削除する

下のカスタムフォーマットがあらかじめ用意されています。

カンマ区切りポイント

固定長ポイント

名前，東距，北距，標高，コード

名前，緯度，経度，高度(ローカル度の小数)

名前，緯度，経度，高度，(WGS-84 度の小数)

名前，緯度，経度，高度，コード(ローカル)

名前，緯度，経度，高度，コード(WGS-84 )

名前，北距，東距，標高，緯度，経度，高度，コード(ローカル)

名前，北距，東距，標高，緯度，経度，高度，コード(WGS-84 )

名前，北距，東距，標高，コード

道路上のポイント

ポイント�杭打ち

道路�キャッチ(Catch)ポイント

道路�ストーリーボード

ユーザ定義のフォーマットはアルファベット順に表示されます。

ノート：ASCII ファイルにエクスポートされる値は，常に標準型で書き込まれます。すなわち，桁区切り記号(1000毎のカンマ)がなく，小数点の記号はあります。Microsoft Windows のコントロールパネル/地域のオプション/数値オプションは使用されません。

すべてのカスタムエクスポートフォーマットはAsciiexp.dat ファイルに書き込まれます。


特徴･属性ライブラリオプションダイアログ

このダイアログを使用してエクスポートするTrimble Survey Controller のバージョンを設定します。

バージョン

バージョン7.00 より前のバージョンを選択した場合，特徴･属性ライブラリ選択オプションダイアログの属性エクスポートのチェックボックスは使用できません。これは7.00 より前のバージョンは属性をサポートしていないためです。


AutoCAD エクスポートオプションダイアログ

このダイアログを使用してエクスポートするAutoCAD のバージョンを設定します。

データフォーマット

データの出力フォーマットを次の選択肢から選択します。

DWG (バイナリのAutoCAD ドローイングファイル)

ASCII DXF (標準的なAutoCAD DXF(Data eXchange File)ファイル)

バイナリDXF (標準的なバイナリのAutoCAD DXF(Data eXchange File)ファイル)

ノート：データフォーマットはあなた自身(またはあなたのお客様)の必要に応じて決定されます。

バージョン

エクスポートファイルに適切なAutoCAD のバージョンを選択します。これはエクスポートするシステムによって決まります。

ドローイング見本

このフィールドを使用して，システムが作成する*.dxf および*.dwg で使用するブロック定義の基本となるAutoCAD のドローイング見本を参照します。

Trimble Geomatics Office がAutoCAD ファイルを作成する時、プロジェクトで使用されている記号の名前を指定されたドローイング見本のブロック定義に適合するようにします。記号名のスペースはAutoCAD のブロック名では下線になります。

記号名がドローイング見本のブロック名に適合した場合，適切なブロックが，必要な縮尺と回転でエクスポートファイルに挿入されます。ドローイング見本のブロックに適合できなかった記号名は，すべてポイントとして挿入されます。指定されたドローイング見本(Symbols.dxf )には，システムで用意されているすべての標準記号のためのブロック定義があります。

ノート：ドローイング見本のブロック定義は，200単位x 200単位として変換されます。単位とはエクスポート時の表示単位のことです。200x200の定義はTrimble の記号エディタおよびラインタイプエディタユーティリティで使用されているグリッドに適合します。独自のブロック定義のあるドローイング見本を作成したい場合は，正確な縮尺と記号をエクスポートするため，ブロックが200x200定義を基本にしていることを確認してください。

参照

参照をクリックしてシステムを参照し，使用したいAutoCAD ファイルを探します。


ASCII エクスポートフォーマット定義ダイアログ

このダイアログを使用してASCII エクスポートフォーマットを定義します。

名前

エクスポートフォーマットの名前を入力します。この名前はエクスポートダイアログのカスタムタブのタイプリストに表示されます。重複する名前は入力できません。

空白文字列

エクスポートフォーマット定義に空白文字列を入力します。このフィールドはオプションです。値が入っていないデータベースフィールドを見つけるごとに，Trimble Geomatics Office はファイルフォーマットで指定された空白文字列を出力します。

ノート：ファイルタイプによっては�99999.99�，�*****�，あるいは類似の特殊な文字列が必要かもしれません。設定を特定することにより，Trimble Geomatics Office で自分の好みの設定を使用することができます。

説明

エクスポートフォーマットの説明を入力します。この説明はステータスバーに表示されます。このフィールドはオプションです。

標準拡張子

エクスポートフォーマットのファイル拡張子を入力します。例えば，.dat または.fbk。このフィールドはオプションです。省略された場合は�*.txt�となります。

ノート：Trimble Geomatics Office は名前を付けて保存ダイアログのファイルの種類の拡張子を特定します。新しいファイルのファイル名はファイル名フィールドに入力できます。選択されたフォルダにある同じ拡張子のファイルがすべて表示されますので必要であれば上書きすることもできます。Trimble Geomatics Office は拡張子にピリオドがあると自動的に仮定します。

エクスポート元

エクスポートするファイルのソースとして，主なテーブルまたはクエリーを1つ選択します。標準ソースはポイントレコードです。これにより，ポイントテーブルからすべてのレコードをエクスポートします。

フォーマットを自動的に設定

フォーマットを自動的に設定をクリックしてヘッダーと本文を自動的に初期化します。詳細についてはフォーマットを自動的に設定をご覧ください。

ヘッダーフォーマット

テキスト，フィールドコード定義，またはその両方を(ショートカットメニューから)入力します。Trimble Geomatics Office は，これを使用してエクスポートファイルの最初の固定部分を作成します。

システムで使用できるフィールドコードに関する詳細はフィールドコード�概要をご覧ください。

ヘッダー定義に空行を追加するにはEnterを押します。

本文フォーマット

(ショートカットメニューから)適切なフィールドコード定義を入力して，Trimble Geomatics Office がデータベースからエクスポートするかデータを指示します。出力定義はこのフィールドに入力します。1つのエンティティのデータを複数行にエクスポートする場合，定義を使用します。これを行うにはEnterを押して新しい定義ラインを始めます。

ノート：システムで使用できるフィールドコードに関する詳細はフィールドコード�概要をご覧ください。

フッターフォーマット

(ショートカットメニューから)テキスト，フィールドコード定義，あるいはその両方を入力します。Trimble Geomatics Office はこれを使用してエクスポートファイルの最後の固定部分を作成します。このフィールドはオプションです。

システムで使用できるフィールドコードに関する詳細はフィールドコード?概要をご覧ください。

フッター定義に空行を追加するにはEnterを押します。

カスタムASCII エクスポートの用例はトピックASCII エクスポートフォーマット定義�用例をご覧ください。


ASCII エクスポートフォーマット定義ー用例

関連項目

これらの用例はASCII エクスポートフォーマットをどのように定義するかを説明します。プロジェクトに下のポイントが存在すると仮定しています。

名前：1000	東距：534247.541	北距：263104.807	標高：10.118	コード：STN

名前：1024	東距：534220.249	北距：263104.249	標高：10.129	コード：MH

名前：1025	東距：534222.850	北距：263100.894	標高：10.133	コード：TREE

名前：1026	東距：534222.218	北距：263095.934	標高：10.136	コード：TREE

名前：1027	東距：534224.816	北距：263092.579	標高：10.140	コード：POLE

名前：1028	東距：534228.398	北距：263089.101	標高：10.732	コード：FENCE

名前：1041	東距：534236.948	北距：263084.989	標高：11.054	コード：FENCE

名前：1042	東距：534237.326	北距：263087.964	標高：10.982	コード：FENCE

名前：1087	東距：534243.575	北距：263099.773	標高：10.154	コード：MH

用例 1

エクスポートフォーマット：

ヘッダーフォーマット：

ファイルフォーマットバージョン1.50

日付：[$システム.日付]

プロジェクト：[$プロジェクト.名前]

本文フォーマット：

[名前]，[東距：0.3]，[北距：0.3]，[標高：0.3]，[特徴コード]

フッターフォーマット：

[$システム.情報]

この本文フォーマットは下のエクスポートファイルを作成します(ただし，適当な日付，Microsoft Windowsの日付フォーマット設定，プロジェクト名です)：

ファイルフォーマットバージョン1.50

日付：8/11/96

プロジェクト：Example

1000，534247.541，263104.807，10.118，STN

1024，534220.249，263104.249，10.129，MH

1025，534222.850，263100.894，10.133，TREE

1026，534222.218，263095.934，10.136，TREE

1027，534224.816，263092.579，10.140，POLE

1028，534228.398，263089.101，10.732，FENCE

1041，534236.948，263084.989，11.054，FENCE

1042，534237.326，263087.964，10.982，FENCE

1087，534243.575，263099.773，10.154，MH

Trimble Geomatics Office，バージョン1.50

用例 2

エクスポートフォーマット：

ヘッダーフォーマットなし

本文フォーマット：

[名前：4][東距：12.3][北距：12.3][標高：12.3][特徴コード]

本文フォーマットはしたのエクスポートファイルを作成します。

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 TREE

1026  534222.218  263095.934      10.136 TREE

1027  534224.816  263092.579      10.140 POLE

1028  534228.398  263089.101      10.732 FENCE

1041  534236.948  263084.989      11.054 FENCE

1042  534237.326  263087.964      10.982 FENCE

1087  534243.575  263099.773      10.154 MH

ノート：Trimble Geomatics Office は，ヘッダーと本文の最後に新しい行が挿入されると仮定します。さらに新しい行を追加するにはEnterを押してください。挿入ポインタが1行下の1番左に移動し，新しいテキストを入力する空行を作成します。


SDMS フォ－マットオプション
SDMS フォーマットオプション

SDMS （Survey Data Management System）フォーマット（AASHTO （American Association of State Highway and Transportation Officials）によって定義）には測量データに関する専用のフォーマットがあります。Trimble Geomatics Office からこのフォーマットでデータをエクスポートします。

このオプションはポイントとその属性ノートをエクスポートします。このノートには拡張ポイント属性が含まれます。この属性ノートは測量中にTrimble Survey Controller が動作している装置に入力されます。Trimble Survey Controller の専用属性ノート機能によって入力できます。さらに，2文字の識別子とそれに続くコロン(：)またはスペースで入力されたすべてのノートレコードはSDMS ファイルへエクスポートされます。

例えばI0：information またはI0 information を含むノートはSDMS ファイルにI0：information としてエクスポートされます。'information'はSDMS の識別子，I0 に関係のあるテキストです。

作成されたSDMS ファイルに正しいポイントに関連する属性ノートが存在するには，エクスポートのときにTrimble Survey Controller の*.dc ファイルがプロジェクトへインポートされたときに自動作成された選択セットを選択します。この選択セットは(記録されたノートを含む)すべてのデータを.dc ファイルに見られるように測量の順に保持しています。


外部フィルタ-概要
外部フィルタ－－概要

Trimble Geomatics Office には外部インポートフィルター，および外部エクスポートフィルターを追加するオプションがあります。メインシステムプログラムとは独立した，専用のエクスポート機能を有するダイナミックリンクライブラリ(.dll )として作成することができます。.dll はオブジェクトリンク組み込み(OLE )モジュールとして作成してください。このモジュールはまた，コンポーネントオブジェクトモジュール(COM )として参照されます。

下のエクスポート関数は，必ず外部フィルターに用意されている必要があります。

GetGUID 関数

Pascal 関数宣言：	function GetGUID:TGUID;stdcall;export;

C/C++関数宣言：	GUID __stdcall __export GetGUID()

この関数は，プログラムに割り当てられたユニークなコンポーネントクラスのOLE ID(GUID -Globally Unique IDentifier )を返します。このユニークなID は，一般にコンピュータの時間，日付，ネットワークカードID，またはそれらに類似の情報に基づいてユニークなID を作成するプログラムを使用して得られます。ID は世界中にただ1つであるべきであり，従ってとても大きな数字(32桁)を使用して得られたものとします。なぜなら，2つの乱数が同じ値を持つということは統計的に考えられないからです。GUID の例：07F750A3-594B-11D1-8E4C-0000C04FCAF9.

Convert 関数

Pascal 関数宣言：	function Convert(const FileName:WideString):WordBool;

C/C++関数宣言：	BOOL __stdcall __export Convert(BSTR FileName)

これはフィルターの実作業を行う関数です。フィルタープログラムは，データをソースファイルから目的ファイルへ，並べ替えられた適切なフォーマットデータに変換するように設計されている必要があります。この関数によってTrimble Geomatics Office はフィルターによって作成される目的ファイルの名前を特定します。インポートフィルターの場合，Trimble Geomatics Office は，フィルターがソースファイルの選択を行う標準のファイル/開くダイアログを呼び出すことを想定しています。システムで定義したフィルタープログラムが作成する目的ファイルの名前はConvert 関数内でフィルターに渡されます。インポートフィルタープログラムで作成されたファイルは，有効な.dc ファイルフォーマット(Survey Controller またはSDR ファイルフォーマット)でなければなりません。

エクスポートフィルターの場合，Trimble Geomatics Office は，フィルターが目的ファイルの選択を行う標準のファイル/保存ダイアログを呼び出すことを想定しています。Trimble Geomatics Office は下で説明するFormat 関数で定義されたファイルフォーマットに従ってソースファイルを作成します。ソースファイルの名前はConvert 関数へ渡されるので，フィルターはどのファイルを処理するか知ることができます。Trimble Geomatics Office はエクスポート処理のために定義された選択セット基準に従って，データベースからデータを引き出します。フィールドコード定義は，Format 関数で定義されるように，Trimble Geomatics Office によってソースファイルに書き込まれたデータのフォーマットをコントロールします。エクスポートフィルタープログラムはソースファイルを読み込み，データを適切なエクスポートフォーマットに変換し，指定された目的ファイルに書き込まなければなりません。

GetLongDesc 関数

Pascal 関数宣言：	function GetLongDesc:WideString;safecall;

C/C++関数宣言：	BSTR __stdcall __export GetLongDesc()

この関数は，インポート/エクスポートダイアログでインポート/エクスポートフィルターオプションがハイライトされたときにTrimble Geomatics Office のステータスバーに表示されるテキストを与えます。この関数の定義はオプションです。省略された場合，フィルターオプションがハイライトされてもステータスバーに何も表示されません。

GetShortDesc 関数

Pascal 関数宣言：	function GetShortDesc:WideString;safecall;

C/C++関数宣言：	BSTR __stdcall __export GetShortDesc()

この関数は，フィルターの選択を行うTrimble Geomatics Office のインポート/エクスポートダイアログで表示されるインポート/エクスポートのフィルター名を与えます。

Format 関数

Pascal 関数宣言：	function Format:WideString;safecall;

C/C++関数宣言：	BSTR __stdcall __export Format()

この関数はエクスポートフィルターでのみ必要です。この関数によりTrimble Geomatics Office で作成されるソースファイルのフォーマットをプログラムに指定します。この関数から返されるテキスト文字列は，Trimble Geomatics Office の有効なフィールドコードを含んでいる必要があります。エクスポートフィルタープログラムでFormat 関数が定義されていない場合，Trimble Geomatics Office はエクスポートフィルターに読み込むフォーマットとして'[Name],[Northing],[Easting],[Elevation],[Feature code]'，つまりカンマで区切った名前，北距，東距，標高，特徴コードのファイルを作成するフォーマットを想定します。


GPS データファイル(*.dat)オプション

.dat ファイルにはGPS 受信機からのGPS の生のデータがあります。このファイルには後処理キネマティックのデータや静止データが含まれている可能性があります。GPS .dat ファイルには座標系の情報はありません。

下のものから.dat ファイルをTrimble Geomatics Office のプロジェクトへ読み込むことができます。

Trimble Survey Controller  (.dc ファイルと共に)

Trimble 測量GPS 受信機

コンピュータ

ノート：ある.dat ファイルを同じプロジェクトに2回以上読み込んだ場合，プロジェクトのデータベースにすでにある観測は標準ではDAT チェックインダイアログで選択されません。


RINEX ファイルオプション

RINEX （Receiver INdependent Exchange）フォーマットは､複数の受信機製造業者からのファイルを交換するために使用される標準GPS生データファイルフォーマットです。

このフォーマットを使用するには，次のファイルが必要です。

RINEX ファイル	ファイル拡張子	オプション
観測データファイル	*.obs,*.XXo	－
航法メッセージファイル	*.nav,*.XXn	－
気象ファイル	*.met or *.XXm ファイル	このファイルはオプションです
コンピュータのRINEX ファイルをTrimble Geomatics Office へインポートするには次の1つを行ないます。

インポートダイアログを使用してRINEX ファイル(*.obs,*.??o)を選択する。

ドラッグ･アンド･ドロップ機能を使用する。

観測データを選択します。観測ファイルと航法ファイルが同じ名前でない場合，航法ファイル指定ダイアログで観測ファイルと航法ファイルを組み合わせてください。対応する.nav ファイルの選択へナビゲートするか，航法ファイルリストから選択します。

DAT チェックインダイアログはGPS 観測がインポートされる前に値をチェックするために表示されます。アンテナタイプと受信機タイプが�不明�でないことを確認してください。

RINEX ファイルが転送され，すべてのGPS 観測がプロジェクトデータベースにインポートされるとRINEX ファイルと同じ名前の選択セットが作成されます。

RINEX ファイルがTrimble Geomatics Office のプロジェクトにインポートされると，Trimble Geomatics Office を使用してGPS の基線解析を行うことができ(ただし，基線解析モジュールがインストールされている場合)，Timeline  モジュールを使用して生のGPS 観測を表示することができます(ただし，基線解析モジュールがインストールされている場合)。


Survey Controller クラスおよびTrimble Geomatics Office におけるそれらの取り扱い

Trimble Survey Controller でポイントを作成した場合，そのポイントはポイントクラスに割り当てられます。プロジェクトにポイントをインポートした場合，Trimble Geomatics Office はこのクラスを使用し，ポイントの座標を決定した方法を使用してポイントの質をポイントに割り当てます。再計算は質を使用してポイントの計算した座標を決定します。

下のテーブルはTrimble Survey Controller がポイントに与えるクラスと，Trimble Geomatics Office がインポート時にそれをどう扱うかについて説明しています。

クラス	説明	インポート時に行われること
基準点	基準点クラスは，Trimble Survey Controller でポイントに割り当てられる最高の質。	ポイントの基準座標としてインポート。
ノーマル	ノーマルクラスは，杭打ちされたポイントを除くすべての観測されたポイントに与えられる。キー入力されたポイントもこのクラスを与えられる。	ポイントの観測と座標をインポート。座標には測量の質が与えられる。
杭打ち	杭打ちクラスは，杭打ち中に観測されたポイントに与えられる。	ポイントの観測と杭打ちの詳細をインポート。プロパティウィンドウの杭打ちタブで杭打ちの詳細を表示できる。
後視	後視クラスは，フィールドで後視ポイントとして定義されたポイントに与えられる。	後視クラスはTrimble Geomatics Office ではノーマルクラスと同等に扱われる。
チェック	チェッククラスは，チェック観測，または重複ポイントとしてキー入力され，かつチェックポイントとして保存された座標に与えられる。	�チェックとして有効�クラスで観測をインポート。
削除済	削除済クラスは，Survey Controller ソフトウェアで上書き，または削除されたポイントに与えられる。	削除済クラスのポイントはTrimble Geomatics Office のプロジェクトにインポートされません。.dc ファイルの削除済ポイントリストはファイルインポート時に作成されるレポートに含まれます。


Survey Controller クラスを使用している.dc ファイルからの座標と観測デ－タに割り当てられる質
Survey Controller クラスを使用している.dc ファイルからの座標と観測データに割り当てられる質

GPS の座標がTrimble Survey Controller に保存されている場合，その座標は他の測定技術によって求められたり，キー入力されたりした可能性があります。ポイントに与えられる質は，観測方法やポイントを入力した時に与えられた質に依存します。

下のテーブルは座標に割り当てられる質について，Trimble Survey Controller のクラスを使用して説明しています。

座標の決定方法	割り当てられる質
基準点で入力	基準点
ノーマルで入力	測量
RTK フィックス	測量
RTK フロート	マッピング
L1 コード	マッピング
単独測位	不明
WAAS	マッピング
広域フィックス	測量
広域フロート	マッピング
RTCM コード	マッピング
コピー	コピー元の質
ノート：Trimble Survey Controller の.dc ファイルのバージョンが7.5 以降の場合，ここキーを使用して基準局の位置を決定した場合，単独測位が方法として書き込まれ，その位置の質は不明でインポートされます。

GPS サイトキャリブレーションを行ない，しかも結果が信頼できるものである場合，測量する基準点の質を高くすることができ，またその基準局から観測したすべてのポイントにはその質が割り当てられます。

Trimble Survey Controller の.dc ファイルのバージョンが7.5 より前の場合，ここキーを使用して基準局の位置を決定した場合，基準局の位置には測量の質が与えられます。

下のテーブルは観測に割り当てられる質についてTrimble Survey Controller のクラスを使用して説明しています。

観測方法	割り当てられる質
一般測量機	測量
レーザー測距儀	マッピング
L1 フィックス	測量
L1 フロート	マッピング
L1 コード	マッピング


Leica GSI-16 ファイルのインポート

Leica GSI-16 フォーマットファイルをインポートする場合，Trimble Geomatics Office は観測ブロック，およびそのブロックに割り当てられたコメント(Rem words )だけを読み込みます。インポート処理は，ステーション情報に適用される特別な用語(レコード)を使用します。インポート処理時に下の用語インデックスが読み込まれ変換されます。

ｲﾝﾃﾞｯｸｽ	意味	ｲﾝﾃﾞｯｸｽ	意味
11	ポイント ID (観測ブロック ID )	82	ポイント北距
21	水平角	83	ポイント標高
22	高度角	84	ステーション東距
31	斜距離	85	ステーション北距
32	水平距離	86	ステーション標高
33	垂直距離	87	反射鏡高
71�79	リマーク (コード･ノートに使用 )	88	器械高
81	ポイント東距
これらの用語インデックスに基づき，Trimble は次のステーションデータおよび観測データの記録マスクをLeica の機器に設定することをお勧めします。

ステーションデータマスク	観測データマスク
ポイント ID (11)	ポイント ID (11)
ステーション東距(84)	水平角 (21)
ステーション北距(85)	高度角 (22)
ステーション標高(86)	斜距離(31)
器械高(88)	ppm およびプリズム定数(51)
コード (71)	反射鏡高 (87)
ノート (72)	コード (71)
	ノート (72)
ノート：インポート時，ソフトウェアはステーションレコード後の最初の観測レコードを後視の観測とみなします。最初のリマーク(71 )はポイントコードとして変換され，他のリマーク(72�79 )はノートレコードとして変換されます。


デジタルレベルファイル(*.dat,*.raw)オプション

デジタルレベルファイルには，デジタルレベルに保存されたデータがあります。

下のデジタルレベルからのデータファイルはサポートされています。

Trimble DiNi デジタルレベル

Leica NA 2002/3003

デジタルレベルファイルがインポートされる時、デジタルレベルインポートダイアログが表示されます。

ノート:Zeiss DiNi デジタルレベルからのデータファイルはM5 フォーマットで転送しなければなりません。


NGS Bluebook エクスポート

NGS Bluebook エクスポートにより，Trimble Geomatics Office から標準National Geodetic Survey (NGS)Bluebook ファイルをエクスポートします。

Bluebook ファイルは米国政府により定められ，the National Spatial Reference System に従った測量に必要です。この測量規則はblue book に収められています。また，準拠している測量は澱luebooking�として知られています。

NGS Bluebook ユーティリティはGPS 基線に関する下のbluebook ファイルを作成します。

NGS

B �プロジェクト情報

G �基線情報

SERFIL �既存プロジェクトからのステーションSSN，ID，ステーション名を含むASCII ファイル

NGS Bluebook ファイルダイアログは，プロジェクトで独立に解析された選択セットの関連データを使用します。NGS ファイルをエクスポートする前に必ずすべての現場作業，解析，結果考察を完了してください。いったん基線を選択してエクスポートを始めると，エクスポート処理をもう1度行わない限り，Bluebooking ダイアログに基線を追加することはできません。

ノート：各現場のNGS Bluebook エクスポートダイアログに必要なデータの説明については，的nput Formats and Specifications of the National Geodetic Survey (NGS)Data Base�をご覧ください。NGS 参考資料は次のURL から入手できます。http://www.ngs.noaa.gov/FGCS/BlueBook/


NGS Bluebook ファイルダイアログ

NGS Bluebook エクスポートフィルターによりTrimble Geomatics Office から標準的なNational Geodetic Survey (NGS)Bluebook ファイルを作成することができます。

NGS Bluebook はプロジェクトで独立に解析された選択セットの関連データを使用します。NGS ファイルをエクスポートする前に必ずすべての現場作業，解析，結果考察を完了してください。いったん基線を選択してエクスポートを始めると，エクスポート処理をもう1度行わない限り，NGS Bluebook ファイルダイアログに基線を追加することはできません。

NGS Bluebook ファイルダイアログを呼び出すには、

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブでNGS Bluebook ファイルを選択します。

ノート：以前にbluebooking セッションを保存したことがある場合，保存されている情報を読み込むかどうかの確認画面が表示されます。

NGS Bluebook エクスポートダイアログのタブを使用してプロジェクトに関する情報を入力します。

プロジェクトタブ

このタブにはプロジェクト全般の情報があります。

ステーションタブ

このタブには選択されている基線に関連するすべてのステーションの情報があります。

自動作成ボタンを使用して4 文字のID とステーションSN を入力します。ID はステーション名のはじめの4文字を使用して作成されます。SN は0001 または使用できる最初の数字から順番に作成されます。

State/Country Code 欄はプロジェクトタブの情報から自動的に設定されます。

リストから順序を選択します。

すべてのbluebook データはGPS 観測方法からなので，Type 欄は自動的に標準のA-Interferometric Satellite Relative Positioning Main Scheme が設定されます。

SERFILボタンを使用して以前のプロジェクトのSERFIL から既存ステーションの4文字のID とSN をインポートします。SERFIL には必ず各ステーションのステーション名が必要です。このフォーマットはNGS SERFIL フォーマットと少し異なりますが，NGS はこのファイルを許可しています。下は使用しなければいけないフォーマットです。

4文字のID   ステーションSN    ステーション名

COWB   0004   COWBOY

セッション情報タブ

このタブには選択された基線の各現場のセッションに関する情報があります。色の違いはそれぞれ独立した基線セッションを表します。

開始時刻は独立した各々の基線の開始時刻ではなく，セッションのすべての受信機の最後の開始時刻を表します。時刻はセッションを野帳と照らし合わせる際に参照として使用されるだけです。

Receiver 欄は受信機タイプとシリアル番号が自動的に設定されます。

Antenna 欄はアンテナタイプが自動的に設定されます。しかし，シリアル番号は入力してください。いったん，各アンテナシリアル番号が入力されると，ドロップダウンリストから選択できます。

Antenna Height (Meters/APC L1)欄は現場かチェックイン中に入力したアンテナ高からL1 の位相中心への垂直高が計算され，自動的に設定されます。

プレセッション気象およびポストセッション気象タブ

プレセッションまたはポストセッションの気象タブには選択された基線に関連する各観測の気象に関する情報があります。このフィールドはB以上の測量を行う場合に必要です。1st オーダーの測量がプロジェクトタブで選択された時点でタブの前についているアスタリスクは自動的に消えます。

フィールド�	標準値�
乾球	摂氏
湿球	摂氏
湿度	パーセント
気圧	ミリバール
Weather Code フィールドはコードを直接入力するか現在のフィールドを編集ボタンを使用して入力します。

現在のフィールドを編集ボタンにより各変数の説明からコードを表示したり選択したりできます。

プレ(ポスト)セッション気象へコピーフィールドは同じデータをプレセッション気象タブからポストセッション気象タブへ，またはその逆にコピーするために使用されます。

その他タブ

その他タブには解析に関する全般情報があります。

機器

機器ボタンにより各受信機およびアンテナに関する情報を表示，追加，編集できます。

OK

OKボタンでNGS Bluebook ファイルダイアログを閉じ各タブの情報を保存します。大量のデータを入力している時，保存して後で戻ることができます。

エクスポート

エクスポートボタンはすべての必要なフィールドが設定されると使用可能になります。エクスポートボタンで各ファイルの名前を入力しフォルダーを選択します。標準のフォルダーはTrimble Geomatics Office\Projects\<プロジェクト名>\Export です。

ノート：各タブの必須フィールドが完了すると，名前の次にある*が消えます。ダイアログのすべてのフィールドを完了するとエクスポートボタンが使用可能になります。

ノート：NGS Bluebook エクスポートダイアログの各フィールドの必須データに関する説明は的nput Formats and Specifications of the National Geodetic Survey (NGS)データベース�をご覧ください。NGS の参考資料は次のURL から入手できます。http://www.ngs.noaa.gov/FGCS/BlueBook/


Trimble Data Exchange(デ－タ交換)フォ－マット
Trimble Data Exchange(データ交換)フォーマット

利用方法

Trimble Data Exchange(データ交換)フォーマットはTrimble Navigation Limited により次の目的で設計されました：

測量データをTrimble Geomatics Office プロジェクト間で転送する

測量データを網平均や測地操作等の他のアプリケーションへエクスポートする

ノート：網平均ソフトウェアのベンダーがこのフォーマットをサポートしているか確認してください。

このフォーマットを使用してデータをインポート/エクスポートするには，インポート/エクスポートダイアログでTrimble Data Exchange(データ交換)フォーマットオプションを選択します。

下の情報がASCII ファイルに保存されます。

ステーションと座標	GPS ベクトル
一般測量機の観測	レーザ観測
レベル測量情報	方位情報
ファイルは下のセクションから構成されます。

[ 全般 ]

このセクションにはファイルの内容，プロジェクト，各フィールドで使用されている単位に関する全般情報があります。

[ ステーション ]

このセクションには転送するよう選択されたすべてのポイントの名前と座標があります。このセクションの座標は常にローカル測地系です。ステーションレコードに含まれる緯度，経度，北距，東距，楕円体高，標高を持つ個々の観測は各レコードごとに表示されます。

ステーションレコードには，どの座標要素を基準点としてみなしたか，およびステーションに割り当てられた特徴コードの情報があります。

[GPS ]

このセクションには転送するよう選択されたGPS ベクトル基線があります。個々の観測はベクトルレコードにあり，それは次のものを含みます。

始点 / 終点ステーション名	ベクトル要素
共分散情報	アンテナ高
解析タイプ	レシオ
RMS	リファレンスバリアンス
観測の時間と日付
[ 一般測量機 ]

このセクションには転送するよう選択された一般測量機の観測があります。個々の観測はTerrObs レコードにあり，それは次のものを含みます。

器械点	後視ポイント
前視ポイント	水平角 および誤差
高度角 および誤差	斜距離および誤差
プリズム定数	器械高
観測の日付と時刻(あれば)	ターゲット高
[ レーザ ]

このセクションには転送するよう選択されたレーザ観測があります。個々の観測はLaserObs レコードにあり，それは次のものを含みます。

器械点	磁気偏差
磁気方位	斜距離
高度角	ターゲット高
器械高	ターゲットポイント
観測の日付と時刻(あれば)
[ レベル ]

このセクションには転送するよう選択されたレベル観測があります。個々の観測はLevelObs レコードにありますが，それは次のものを含みます。

一連のレベル観測の始点と終点	高低差および誤差
距離(あれば)	変曲点数(あれば)
観測の日付と時刻(あれば)
[ 方位角 ]

このセッションには方位角レコードがあり，それには個々の観測が含まれます。

ノート:Trimble Data Exchange Format ファイルをTrimble Total Control からエクスポートする時、Trimble Geomatics Office はキー入力した座標セクションからのみデータをインポートします。その場合、基準点か調整座標の質を持つ座標は、基準点の質と一緒にインポートされます。


Terramodel プロジェクトファイル(*.pro)

Trimble Geomatics Office はTerramodel プロジェクトファイル(*.pro)フォーマットをサポートします。

Trimble Geomatics Office を使用して、Terramodel プロジェクトファイル(*.pro)をTrimble Geomatics Office プロジェクトにインポートします。

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	CAD /ASCII タブを選択します。

3.	Terramodel プロジェクトファイル(*.pro)オプションを選択します｡

開くダイアログが現れます。

4.	インポートするファイルを選択して、開くをクリックします。

ノート:ポイントとラインワーク、レイヤーだけがTerramodel プロジェクトファイル(*.pro)からインポートされます。


TDS ソフトウェア－概要

関連項目

Trimble Geomatics Office は以下のTDS ソフトウェアをサポートします。

TDS Survey Pro CE

TDS 3600 オンボード

TDS 5600 オンボード

ご利用のPCからTDS ファイルをインポートしたりエクスポートしたりできます。測量装置のインポート/エクスポートオプションを使用してTDS ソフトウェアから/へそれを直接転送することもできます。

ノート:Trimble Geomatics Office は､TDS コントロールファイルをサポートしません。ファイルを転送する前に使用されたコントロールファイルから主要ジョブへポイントをインポートする必要があります。更に詳しくは、TDS の取扱説明書を参照してください。

ノート:Trimble Geomatics Office は､TDS の特徴と属性をサポートしません。

TDS Survey Pro CE

Trimble Geomatics Office は､TDS Survey Pro CE からの以下のファイルをサポートします。

名前	拡張子	インポート	エクスポート	説明
ジョブ	*.job			ポイントと座標情報を含みます。TDS Survey Pro CE プロジェクトからポイントだけをインポートしたい時にジョブファイル(*.job)をインポートします。
生	*.raw		X	観測情報を含みます。TDS Survey Pro CE プロジェクトからポイントと観測の両方をインポートしたい時に生ファイル(*.raw)をインポートします。
説明	*.txt	X		TDS Survey Pro CE でポイントの説明を入力するのに役立つ特徴コードの簡素テキストファイル
ジオイドグリッド	*.ggf	X		WGS84 参照楕円体(TDS Survey Pro CE バージョン3.5 以降)との区別

エクスポートするには、

RoadLink から道路定義(*.job,*.rd5,*.tp5)をエクスポートするには、RoadLink ヘルプを参照してください。

DTMLink からDTM (*.dtm)をエクスポートするには、DTMLink ヘルプを参照してください。

こういったファイルに関する更に詳しい情報には、TDS の取扱説明書を参照してください。

Trimble Geomatics Office は、TDS Survey Pro CE ソフトウェアのすべてのバージョンに対して座標系サポートを提供します。これには、TDS Survey Pro CE 3.5 以降がTrimble GPS 受信機と一緒に使用される時に使用可能な、機能向上した測地機能へのサポートも含まれます。TDS Survey Pro CE からインポートされたすべてのファイルは、Survey Controller (*.dc)ファイル内の座標系定義と同一な完全座標系定義を含みます。

ノート:GPS 観測は、Trimble GPS 受信機と一緒に使用されるTDS Survey Pro CE 3.5 以降からしかインポートできません。あらゆるブランドのトータルステーションからの一般測量観測はすべてのバージョンがサポートします。

Trimble 3600/5600 TDS

Trimble Geomatics Office は､Trimble 3600/5600 TDS ファイルからの以下のファイルをサポートします。

名前	拡張子	インポート	エクスポート	説明
座標	*.cr5			ポイントと座標情報を含みます。Trimble 3600/5600 TDS プロジェクトからポイントだけをインポートしたい時に座標ファイル(*.cr5)をインポートします。
生	*.rw5		X	観測情報を含みます。Trimble 3600/5600 TDS プロジェクトからポイントと観測の両方をインポートしたい時に生ファイル(*.rw5)をインポートします。
説明	*.txt	X		TDS Survey Pro CE でポイントの説明を入力するのに役立つ特徴コードの簡素テキストファイル
エクスポートするには、

RoadLink から道路定義(*.cr5,*.rd5,*.tp5)をエクスポートするには、RoadLink ヘルプを参照してください。

DTMLink からデジタル地勢モデル(*.dtm)をエクスポートするには、DTMLink ヘルプを参照してください。

こういったファイルに関する更に詳しい情報には、TDS の取扱説明書を参照してください。

Trimble 3600/5600 TDS ソフトウェアからインポートされたファイルには、完全な座標系定義は含まれません。ファイルは､Survey Controller (*.dc)ファイルと同様に、縮尺のみ座標系を使用してインポートされます。

ファイルをインポートする時に、Trimble Geomatics Office はTDS Survey Pro CE ジョブで最近使用された縮尺係数を使用して座標系を定義します。

ノート:Trimble 3600/5600 TDS 座標ファイルをインポートする時、Trimble Geomatics Office は座標(*.cr5)ファイルをインポートしてから、関連する生ファイル(*.rw5)がコンピュータの同じフォルダに存在する場合にそのファイルからデータをインポートします。座標のみをインポートしたい場合には、インポートされる座標ファイルと同じ名前を持つ生ファイルがコンピュータの同じフォルダ内に存在しないことを確認してください。生ファイルは個々にインポートすることもできます。


TDS Survey Pro CE ジョブファイル(*.job)

Trimble Geomatics Office は、TDS Survey Pro CE ジョブファイル(*.job)フォーマットのデータをサポートします。

Trimble Geomatics Office を使用して、

TDS Survey Pro CE ジョブファイルをTrimble Geomatics Office プロジェクトにインポートします。

Trimble Geomatics Office プロジェクトをTDS Survey Pro CE ジョブファイルへエクスポートします。

測量装置のインポート/エクスポートオプションを使用してTDS Survey Pro CE ソフトウェアから/へそれを直接転送できます。

TDS Survey Pro CE ジョブファイルをインポートするには、

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	測量タブを選択します。

3.	Survey Pro CE ジョブファイル(*.job)オプションを選択して、OK をクリックします。

開くダイアログが現れます。

4.	インポートするファイルを選択して、開くをクリックします。

ノート:TDS Survey Pro CE ジョブファイルフォーマットには、ポイントとそれに関連する座標が含まれます。TDS Survey Pro CE プロジェクトからポイントだけをインポートしたい時にこのオプションを使用します。

現在のTrimble Geomatics Office プロジェクトをTDS Survey Pro CE ジョブファイルにエクスポートするには、

1.	ファイル/エクスポートを選択します｡

エクスポートダイアログが現れます｡

2.	測量タブを選択します。

3.	TDS Survey Pro CE ジョブファイル(*.job)オプションを選択して、OKをクリックします｡

名前を付けて保存ダイアログが現れます｡

4.	ファイルを保存するフォルダを選択します｡

5.	ファイル名フィールドに名前を入力して、保存をクリックします。

ノート:エクスポートされた選択の中に重複ポイントが存在する場合には、TDS Survey Pro CE ジョブファイルは作成されません。エクスポートされたポイントすべてが重複しない名前を持つことを確実にしてください。


TDS Survey Pro CE 生ファイル(*.raw)

Trimble Geomatics Office を使用して、TDS Survey Pro CE 生ファイルをTrimble Geomatics Office プロジェクトにインポートします。測量装置のインポートオプションを使用してTDS Survey Pro CE ソフトウェアから直接ファイルを転送することもできます。TDS Survey Pro CE 生ファイルフォーマットは、Survey Pro CE プロジェクト内のすべての情報を含みます。TDS Survey Pro CE プロジェクトからポイントと観測の両方をインポートしたい時にこのオプションを使用します。

TDS Survey Pro CE 生ファイルをインポートするには、

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	測量タブを選択します。

3.	TDS Survey Pro CE 生ファイル(*.raw)オプションを選択して、OKをクリックします｡

開くダイアログが現れます。

4.	インポートしたいフォルダからファイルを選択して、開くをクリックします。


Trimble 3600/5600 TDS 座標ファイル(*.cr5)

Trimble Geomatics Office を使用して、

Trimble 3600/5600 TDS 座標ファイルをTrimble Geomatics Office プロジェクトにインポートします。

Trimble Geomatics Office プロジェクトをTrimble 3600/5600 TDS 座標ファイルへエクスポートします。

測量装置のインポート/エクスポートオプションを使用してTrimble 3600/5600 TDS ソフトウェアから/へそれを直接転送できます。

Trimble 3600/5600 TDS 座標ファイルをインポートするには、

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	測量タブを選択します。

3.	Trimble 3600/5600 TDS ファイル(*.cr5)オプションを選択します｡

開くダイアログが現れます。

4.	インポートするファイルを選択して、開くをクリックします。

ノート:Trimble 3600/5600 TDS 座標ファイルをインポートする時、Trimble Geomatics Office は

座標ファイルをインポートしてから、関連する生データファイル(*.rw5)がコンピュータの同じフォルダに存在する場合にそれをインポートします。インポートに選択された座標ファイルと同じフォルダに生データファイルが存在しない場合には、ポイントだけをインポートできます。

現在のTrimble Geomatics Office プロジェクトをTrimble 3600/5600 TDS 座標ファイルにエクスポートするには、

1.	ファイル/エクスポートを選択します｡

エクスポートダイアログが現れます｡

2.	測量タブを選択します。

3.	Trimble 3600/5600 TDS 座標ファイル(*.cr5)オプションを選択します｡

4.	OKをクリックします。

名前を付けて保存ダイアログが現れます｡

5.	ファイルを保存するフォルダを選択します｡

6.	ファイル名フィールドに名前を入力して、保存をクリックします。

ノート:エクスポートされた選択の中に重複ポイントか、英数字の名前を持つポイントが存在する場合には、Trimble 3600/5600 TDS 座標ファイルは作成されません。エクスポートされたポイントすべてが重複しない数字の名前を持つことを確実にしてください。


Trimble 3600/5600 TDS 生ファイル(*.rw5)

Trimble Geomatics Office を使用して、Trimble 3600/5600 TDS 生ファイルをTrimble Geomatics Office プロジェクトにインポートします。測量装置のエクスポート/インポートオプションを使用してTrimble 3600/5600 TDS ソフトウェアから/へ直接ファイルを転送することもできます。Trimble 3600/5600 TDS 生ファイルフォーマットは、Survey Pro CE プロジェクト内のほとんどの情報を含みます。Trimble 3600/5600 TDS プロジェクトからポイントと観測の両方をインポートしたい時にこのオプションを使用します。

Trimble 3600/5600 TDS 生ファイルをインポートするには、

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	測量タブを選択します。

3.	Trimble 3600/5600 TDS 生ファイル(*.cr5)オプションを選択します｡

開くダイアログが現れます。

4.	インポートするファイルを選択して、開くをクリックします。


TDS 説明ファイル(*.txt)

TDS Survey Pro CE とTrimble 3600/5600 TDS ソフトウェアは、説明ファイルを使用して、ジョブに保存されているポイントに対する説明を自動的に入力します。説明ファイルに関する更に詳しい情報には、TDS 取扱説明書を参照してください。

Trimble Geomatics Office を使用して、

特徴コードエディタ.から説明ファイル(*.txt)をエクスポートします。

現存する説明ファイル(*.txt)をTDS Survey Pro CE かTrimble 3600/5600 TDS ソフトウェアにエクスポートします。

説明ファイル(*.txt)を特徴コードライブラリからTDS Survey Pro CE かTrimble 3600/5600 TDS ソフトウェアにエクスポートします。

特徴コードエディタから説明ファイルをエクスポートするには、特徴コードエディタのヘルプを参照してください。

現存する説明ファイルをTDS Survey Pro CE かTrimble 3600/5600 TDS ソフトウェアにエクスポートするには、

1.	ファイル/エクスポートを選択します｡

エクスポートダイアログが現れます｡

2.	測量タブを選択します。

3.	説明ファイルをTDS 装置へ(*.txt)オプションを選択して、OKをクリックします｡

選択ダイアログが現れます｡

4.	エクスポートしたいファイルを選択して、開くをクリックします｡

名前を付けて保存ダイアログが現れます｡

5.	TDS 装置を選択して、開くをクリックします｡

ファイルがエクスポートされました。

新しい説明ファイルを特徴コードライブラリからTDS Survey Pro CE かTrimble 3600/5600 TDS ソフトウェアにエクスポートするには、

1.	ファイル/エクスポートを選択します｡

エクスポートダイアログが現れます｡

2.	測量タブを選択します。

3.	特徴・属性ライブラリをTDS 装置へ(*.txt)オプションを選択して、OKをクリックします｡

特徴・属性ライブラリの選択ダイアログが現れます｡

4.	エクスポートするライブラリを選択して、OK をクリックします。

名前を付けて保存ダイアログが現れます｡

5.	TDS 装置を選択して、開くをクリックします｡

ファイルがエクスポートされました。


Zeiss -概要

Trimble Geomatics Office は以下のZeiss 機器でM5 ファイルをサポートします。

Trimble 3300

Trimble 3600 Elta

Trimble 5600 Elta

Trimble Elta GPS Controller

Trimble DiNi デジタルレベル

PCからM5 ファイルをインポートしたり、エクスポートしたりできます。測量装置のエクスポート/インポートオプションを使用して機器から/へ直接ファイルを転送することもできます。

Zeiss ファイルはTrimble Geomatics Office で以下のようにサポートされています。

ファイルフォーマット	サポート
Elta M5  (英語とドイツ語のみ)	あり
Rec 500とR4、R5	なし Trimble Geomatics Office CD は、必要に応じてM5 とRec 500 間のファイルのフォーマット変換ができるプログラムを含みます。
Elta コードリスト	なし

エクスポート

Trimble Geomatics Office はグリッドポイント名とコード、説明、座標をM5 ファイルにエクスポートします。その他のデータ（観測など）はエクスポートされません。）

ノート:エクスポートされたファイルの座標系は、Trimble Geomatics Office プロジェクトが使用するのと同じ小数点以下の桁数で記されますが、Trimble 3300 機器では小数点以下3桁までに、Trimble 3600/5600 Elta とTrimble Elta GPS Controller 機器では4桁までに制限されます。

インポート

ノート:M5 ファイルフォーマットは､完全座標系定義をサポートしません。ファイルは縮尺係数のみの座標系を使用してインポートされます。それは、Survey Controller (*.dc)ファイルで縮尺係数のみの座標系をインポートするのと同じです。Trimble Geomatics Office で座標系をインポートするように定義する時に縮尺係数をキー入力できます。

単位

M5 フォーマットは"m"単位(メートルとナミビアメートルの両方に対する)か"ft"単位(国際フィートかUS測量フィートの両方に対する)を持ちます。

M5 ファイルへエクスポートしたり、それからインポートする時、プロジェクトと機器が同じ単位を使用していない場合には、Trimble Geomatics Office はM5 ファイル内の"m"をメートルと"ft"を国際フィートと仮定します。

Trimble DiNi デジタルレベル

ノート:Trimble Geomatics Office はTrimble DiNi デジタルレベル機器にはエクスポートしません。

Trimble DiNi デジタルレベル機器からのインポートに関しては、デジタルレベルファイル(*.dat,*.raw)のインポートオプションを参照してください。


Trimble 3300/3600/5600 Elta M5 ファイル(*.dat)

Trimble Geomatics Office を使用して、

Trimble 3300/3600/5600 Elta M5 ファイル(*.dat)をTrimble Geomatics Office プロジェクトにインポートします。

Trimble Geomatics Office プロジェクトを3300/3600/5600 Elta M5 ファイル(*.dat)へエクスポートします。

測量装置のインポート/エクスポートオプションを経由してTrimble 3300か3600 Elta、5600 Elta オンボードソフトウェアから/へファイルを直接転送できます。

Elta GPS Controller M5 ファイルをインポート/エクスポートする前に、Trimble 3300/3600/5600 Elta M5 ファイル(*.dat)に対してM5 ファイルオプションが設定されていることを確認してください。

Elta M5 ファイル(*.dat)をインポートするには、

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	測量タブを選択します。

3.	Trimble 3300/3600/5600 Elta M5 ファイル(*.dat)オプションを選択します｡

4.	オプションをクリックして、M5 ファイルダイアログを開き、ファイルを設定します。

5.	OKをクリックしてその設定を受入れ、エクスポートダイアログに戻ります。

6.	OKをクリックします。

開くダイアログが現れます。

7.	インポートするファイルを選択して、開くをクリックします。

ノート:

M5 ファイル内のローカル(相対)座標(例、"neh"や"xyz")はインポート時に絶対座標に変換されます。

M5 ファイルのインポート後に、すべてのプリズム定数がTrimble Geomatics Office 内で"?"と表示されてしまいます。これを変更するには、プロパティウィンドウのプリズム定数フィールドで、フィールドで入力されたプリズム定数と実際のプリズム定数の差を入力します。例えば､プリズム定数を"20"と入力したけれども実際のプリズム定数は"5"の場合、"�15"と入力します。

Trimble Geomatics Office は､直交杭打ちデルタをサポートしません。これはインポート時に極杭打ちデルタに変換されます。グリッド座標杭打ちデルタのみを保存するように機器を設定することをお勧めします。

Trimble Geomatics Office は､左に増加する水平角をサポートしません。機器でこの設定を使用しないでください。

機器の設定

Trimble 3600/5600 Elta 機器から平均された2面観測をインポートする時、機器が単一値のみを保存するように設定されていることを確認してください。単一値と平均の両方が選択されている場合には、Trimble Geomatics Office は誤った値で計算します。また、平均のみが選択されている場合には、Trimble Geomatics Office は平均された観測を正観測として表示します。

Trimble Geomatics Office は､Trimble 3600/5600 Elta 機器が常に大気補正をオンにしてあると仮定します。機器のこの補正をオフにしないでください。

計算のために座標と観測データの両方が揃っていることを確実にするためには､Trimble 3600/5600 Elta 機器上のR-MC 保存オプション(可能であれば)とTrimble 3300 機器上のMEM/3 保存を使用する必要があります。

ステーショニング

Trimble Geomatics Office がデータを正しく解釈することを確実にするために、測定の前にいつも機器のステーショニングルーチンを実行するようにします。

ステーションセットアップから削除された後視レコードもTrimble Geomatics Office にインポートされます。プロパティウィンドウでこういった観測を使用不可にします。

Trimble Geomatics Office は､複数後視をサポートしません。複数の後視ポイントがステーショニングルーチンで測定された場合には、Trimble Geomatics Office は最後のポイントを後視として使用します。

サポートされないElta ルーチン

以下のElta 機器ルーチンは、Trimble Geomatics Office がサポートしない特別データを出力します。しかしほとんどの場合はそれでもTrimble Geomatics Office はこういったルーチンから観測をインポートします。

垂直面

エリア

接続距離

転換

Roadline Lite

Multiple Rounds

3D 面

現在のTrimble Geomatics Office プロジェクトをElta M5 ファイル(*.dat)にエクスポートするには、

1.	ファイル/エクスポートを選択します｡

エクスポートダイアログが現れます｡

2.	測量タブを選択します。

3.	Trimble 3300/3600/5600 Elta M5 ファイル(*.dat)オプションを反転表示します。

4.	オプションをクリックしてM5 ファイルオプションダイアログを開き、ファイルを設定します。

5.	OKをクリックしてその設定を受入れ、エクスポートダイアログに戻ります。

6.	OKをクリックします。

名前を付けて保存ダイアログが現れます｡

7.	ファイルを保存するフォルダを選択します｡

8.	ファイル名フィールドに名前を入力して、保存をクリックします。


Trimble Elta GPS Controller M5 ファイル(*.dat)

Trimble Geomatics Office を使用して、

Elta GPS Controller M5 ファイルをTrimble Geomatics Office プロジェクトにインポートします。

Trimble Geomatics Office プロジェクトをElta GPS Controller M5 ファイルへエクスポートします。

測量装置のインポート/エクスポートオプションを経由してTrimble Elta GPS Controller ソフトウェアから/へファイルを直接転送できます。

Elta GPS Controller M5 ファイルをインポート/エクスポートする前に、Trimble Elta GPS Controller M5 ファイルに対してM5 ファイルオプションが設定されていることを確認してください。

Elta GPS Controller M5 ファイルをインポートするには、

1.	ファイル/インポートを選択します｡

インポートダイアログが現れます。

2.	測量タブを選択します。

3.	Trimble Elta GPS Controller M5 ファイル(*.dat)オプションを選択します｡

4.	オプションをクリックしてM5 ファイルオプションダイアログを開き、ファイルを設定します。

5.	OKをクリックしてその設定を受入れ、インポートダイアログに戻ります。

6.	OKをクリックします。

開くダイアログが現れます。

7.	インポートするファイルを選択して、開くをクリックします。

ノート:Trimble Geomatics Office はM5 ファイル内のすべてのポイントとグリッドポイントとしてしかインポートしません。Trimble Geomatics Office 内の座標がTrimble Elta GPS controller の座標と一致することを確実にするには、測量を始める前にフィールドでキャリブレーション（転換）を実行する必要があります。

現在のTrimble Geomatics Office プロジェクトにElta GPS Controller M5 ファイルをエクスポートするには、

1.	ファイル/エクスポートを選択します｡

エクスポートダイアログが現れます｡

2.	測量タブを選択します。

3.	Trimble Elta GPS Controller M5 ファイル(*.dat)オプションを反転表示します。

4.	オプションをクリックしてM5 ファイルオプションダイアログを開き、ファイルを設定します。

5.	OKをクリックしてその設定を受入れ、エクスポートダイアログに戻ります。

6.	OKをクリックします。

名前を付けて保存ダイアログが現れます｡

7.	ファイルを保存するフォルダを選択します｡

8.	ファイル名フィールドに名前を入力して、保存をクリックします。


M5 ファイルオプションダイアログ

M5 ファイルオプションダイアログを使用して、インポート/エクスポートのために以下のファイルを設定します。

Trimble 3300/3600/5600 Elta M5 ファイル

Trimble Elta GPS Controller M5 ファイル

機器のタイプとファイルマーキング、座標設定、重複ポイント設定(インポートのため)を指定します。

オプションダイアログにアクセスするには、

1.	ファイル/エクスポート(またはインポート)を選択します。

2.	測量タブを選択します。

3.	以下のオプションから1つを選択します｡

Trimble 3300/3600/5600 Elta M5 ファイル(*.dat)

Trimble Elta GPS Controller M5 ファイル(*.dat)

4.	オプションをクリックします。

ファイルマーキング

以下の１つを選択します。

標準(Trimble はこのオプションをお勧めします。)

詳細ボタンをクリックして、標準オプションのラインフォーマット設定とフォーマットプレビューを表示します。

ノート:標準値は選択された機器タイプによって異なります。

ユーザー定義

ユーザー定義オプションを使用して、ラインフォーマットを変更したり、フォーマットプレビューセクションの変更を表示したりできます。ユーザー定義を選択して、詳細をクリックします。マーキング詳細オプションダイアログで、

a.	ポイント名とコード、説明のフィールドの開始文字の位置を指定します。

b.	ポイント名とコード、説明のフィールドの幅を指定します。

c.	マーキング番号を入力します。

ノート:ユーザー定義のラインフォーマット設定が無効の場合には、Trimble Geomatics Office は有効な構成設定を要求します。

座標設定

座標の順序と標高のドロップダウン一覧から、インポート/エクスポートされるべき、ファイル内の座標の順序と座標ラベルを選択します｡

ノート:

使用できるフィールドは選択する機器タイプによって決まります。

使用可能な長さを越えるポイント名やコード、説明はエクスポート時に切り捨てられます。

英数字の名前を持つポイントは、Trimble 3300 機器にエクスポートされません。


ポイント－概要

ポイントとは，Trimble Geomatics Office製品の主な焦点です。ポイントはデータをインポートする度に追加され，またはポイント挿入ダイアログもしくは方位角と距離でポイント挿入ダイアログを使用することによっても追加することができます。

ポイントは，測量表示でも平面図表示でも表示できます。ポイントの詳細を表示するには，ポイントを選択してプロパティウィンドウを開いてください。

ポイントには，再計算によって決定された，計算された位置があります。この位置は，キー入力されたあらゆる座標や観測を基にした，ポイントに対して最も適切な位置になっています。

測量表示ではポイントは点(ドット)で表示され，ポイント間の全ての観測も同時に表示されています。また，平面図では各ポイントはそれぞれのポイントスタイルに応じた表示がされます。データベースには重複する名前をもつポイントを登録することもできます。


ポイント挿入ダイアログ

データベースにポイントを挿入する場合に，このダイアログを使用してください。フィールドは，座標タイプフィールドでどのオプションを選択するかによって変化します。

このダイアログを呼び出すには，次の1つを行ないます。

測量の表示では，挿入／ポイントを選択します。

平面図の場合は，次の1つを行います。

挿入／ポイントを選択します

ポイント挿入ツール [image] をクリックします。

挿入

データベースにポイントを挿入するには，挿入をクリックします。ダイアログは表示されたままになるので，ポイントの追加(もしくは新規作成)にそのまま使用することができます。

ノート：プロジェクトに，未定義の標準(横メルカトル)投影を使用した最初のグリッドもしくはＧＰＳ座標を加える際には、Trimble Geomatics Office はそれに応じたダイアログを表示し，投影の初期化が正しく行えるよう補助します。

閉じる

ポイントの挿入を終了し，ダイアログを閉じるには，閉じるをクリックします。

名前

キーボードを使用して，名前を入力してください。名前は最長16文字(半角)まで入力できます。

以下の文字は，名前に使用することはできません。

｛｝カッコ

［］カッコ

()カッコ

パーセント記号　％

等記号　＝

引用記号灯もしくは''

ノート：ポイントを連続して挿入する際，最後に挿入されたポイントの名前が数字で終わる場合には，それに続く名前も自動的に番号化されます。

ノート：プロジェクトプロパティダイアログでポイント名に規定を設けるには，単位とフォーマットタブを選択し，次にフィールドから自動ポイント名の開始を使用します。

座標系詳細グループ

各座標系コンポーネント(水平，標高，高度)には，それぞれに応じた質を選択してください。これらの質は，再計算がポイントに対して最適な位置を決定するために使用されます。

座標系詳細グループは，このダイアログでWGS-84，グリッド，ローカルのどのオプションを選択するかによって変わります。異なるそれぞれの座標系詳細グループは，座標表示を表しています。

グリッド・オプションを選択した場合，以下のフィールドが表示されます。

北距	グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，もしくはキーボードで数値を入力してください。フィールド記入を使用した場合，北距および東距フィールドは，クリックした位置に応じて埋められます。
東距	グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，もしくはキーボードで数値を入力してください。フィールド記入を使用した場合，北距および東距フィールドは，クリックした位置に応じて埋められます。
WGS-84またはローカル・オプションを選択し，さらにWGS-84表示の設定をL，L，Hにしている場合(プロジェクトプロパティ・ダイアログ内の単位とフォーマットタブ)，以下のフィールドが表示されます。

緯度	グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，もしくはキーボードで数値を入力してください。フィールド記入を使用した場合，緯度および経度フィールドは，クリックした位置に応じて埋められます。
経度	グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，もしくはキーボードで数値を入力してください。フィールド記入を使用した場合，緯度および経度フィールドは，クリックした位置に応じて埋められます。
以下のフィールドは，全てのオプションで表示されます。

標高	キーボードで数値を入力するか，もしくは既存のポイントをクリックします。既存のポイントをクリックした場合，ポイントの標高値は標高フィールドに記入されます。
高度	グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，もしくはキーボードで数値を入力してください。既存のポイントをクリックした場合，ポイントの高度値は高度フィールドに記入されます。
ヒント：測量表示で，観測ラインに沿ってポイントを配置する，もしくは平面図表示でライン等を配置する場合は，Ctrlキーを押しながらフィールド記入を使用してください。

ノート：プロジェクトプロパティ・ダイアログの単位とフォーマットタブでWGS-84表示の設定をX，Y，Zにしている場合，X，Y，Zフィールドが表示されます。グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，もしくはキーボードで数値を入力してください。フィールド記入を使用した場合，これらのフィールドはクリックした位置に応じて埋められます。

座標タイプ

このフィールドでは，データベースに座標を保存する際に使用するオプション(WGS-84，ローカル，グリッド)を選択します。座標タイプを選択すると，座標表示も座標タイプに応じて変更されます。

ノート：座標詳細グループ内のフィールドを編集する場合は，座標タイプと座標表示設定が同じでなければなりません。

CAD詳細グループ

このグループには，平面図に表示されるポイントに関する全てのフィールドが表示されます。

特徴コード

キーボードで数値を入力するか，もしくは既存のポイントをクリックします。既存のポイントをクリックした場合は，特徴コード・フィールド内に，そのポイントに関する特徴コード値が記入されます。

説明

キーボードで数値を入力するか，もしくは既存のポイントをクリックします。既存のポイントをクリックした場合，ポイントの説明値が説明フィールドに記入されます。

レイヤー

次の1つを行ないます。

一覧から既存のレイヤーを選択します。

キーボードを使用して，新しいレイヤーを挿入します。新しいレイヤーダイアログが表示されます。

既存のポイントをクリックします。既存のポイントをクリックした場合，ポイントのレイヤー値がレイヤーフィールドに記入されます。

ポイントスタイル

次の1つを行ないます。

一覧から既存のポイントスタイルを選択します。

キーボードを使用して，新しいポイントスタイルを挿入します。ポイントスタイル作成ダイアログが表示されます。

既存のポイントをクリックします。既存のポイントをクリックした場合は，ポイントスタイル・フィールド内に，そのポイントに関するポイントスタイル値が記入されます。


方位角と距離コマンド

既知のポイントからの方位角と距離の情報を使用してポイントを挿入する場合に，このコマンドを使用します。

このコマンドを呼び出すには，挿入／方位角と距離によるポイントを選択します。

方位角と距離でポイント挿入ダイアログが表示されます。


方位角と距離でポイント挿入ダイアログ

既知のポイントからの方位角と距離の情報を使用してポイントを挿入する場合に，このダイアログを使用します。

このダイアログを呼び出すには，次の1つを行ないます。

挿入／方位角と距離によるポイントを選択します。

平面図で，方位角と距離でポイント追加ツールをクリックします。

ノート：新しいポイントの質は，開始ポイントのものと同じです。標高差が特定されていない場合は，新しいポイントの標高と高度のフィールドは未知になります。

ポイント名

キーボードを使用して，ポイント名を入力してください。名前は最長16文字(半角)まで入力できます。

以下の文字は，名前に使用することはできません。

｛｝カッコ

［］カッコ

()カッコ

パーセント記号　％

等記号　＝

引用記号灯もしくは''

始点

キーボードを使用して既存のポイント名を入力するか，既存のポイントをクリックします。

方位角

このフィールドは，方位角タイプ設定に準拠します。単位とフォーマットタブ内の角度フォーマット(度)に方位角の値を入力してください。

距離

このフィールドは，単位とフォーマットタブ内のフィールドである，表示距離の設定に準拠します。単位が特定されていない場合，プロジェクトで現在使用されている単位がそのまま使用されます。しかし，メートル(m)，国際フィート(ift)，US測量フィート(sft)を指定することも可能です。

デルタ標高

この値は，始点の標高から新しいポイントの標高を算出するために追加されます。プラスの変更は，新しいポイントが始点よりも高い標高に位置していることを意味します。新しいポイントが始点よりも低い標高の場合は，マイナスの値を入力してください。単位が特定されていない場合，プロジェクトで現在使用されている単位がそのまま使用されます。しかし，メートル(m)，国際フィート(ift)，US測量フィート(sft)を指定することも可能です。標高差を特定しない場合，新しいポイントの標高はヌルになります。

方位角タイプ

このグループを使用して，グリッドもしくは測地前方方位角を選択します。

グリッド－グリッド方位角を表示するには，このオプションを選択してください。

測地前方方位－測地前方方位角を表示するには，このオプションを選択してください。

方法

このグループを使用して，ソフトウェアがポイント挿入後に表示するダイアログを選択します。

順次－このオプションを使用する場合，新しいポイントが追加された時に，その新しいポイントの名前を始点フィールドに記入します。このオプションを使用して，トラバースを入力します。

放射状－始点名に変更を加えません。このオプションを使用して，単一ポイントから複数ポイントへの放射状線を入力します。

結合

このチェックボックスを使用して，�始点�と新しいポイントの間にラインを引きます。このラインは現在のレイヤーに追加され，現在のレイヤーに標準設定されたラインスタイルによって描かれます。これは平面図でのみ表示されます。


方位角挿入ダイアログ

方位角は，一般測量機観測を開始するために使用されます。このダイアログを使用して，2つのポイント間に方位角を挿入します。

このダイアログを呼び出すには、

測量表示で，挿入／方位角を選択します。

始点と終点

キーボード，もしくはグラフィック画面の適切な位置をクリックするフィールド記入を使用して，これらのフィールドに既存のポイント名を入力します。

方位角

既存の�始点�と�終点�を入力した場合には，計算された方位角値が表示されます。必要に応じて，数値と方位角の質を編集することもできます。このフィールドに表示される方位角は，下記で指定する方位角表示に準拠します。

2つのポイント間にすでに方位角が登録されている場合，上書きするかどうかを確認されます。

方位角タイプ

このフィールドで，方位角がデータベースにどのような形で保存されるか(グリッドもしくは測地前方方位角として)を決定します。

グリッド／測地前方方位

方位角挿入ダイアログ内で座標がどのような形で表示されるかを決定するオプションを選択します。これが方位角表示です。

ノート：ダイアログ内のフィールドを編集したい場合は，方位角タイプと方位角表示は同じでなければなりません。

ノート：終点が特定の座標を持っていない場合，グリッド方位角と測地前方方位角の間での変換は計算ができません。したがって，方位角はヌルと表示されます。

挿入

このボタンを使用して，プロジェクトに方位角を挿入します。方位角は2つの定義ポイント間に表示され，矢印は方角を示しています。

閉じる

このボタンを使用して，ダイアログを閉じます。


ラインコマンド

このコマンドを使用して，データベースにラインを挿入します。

このダイアログを呼び出すには，次の1つを行ないます。

挿入／ラインを選択します。

ライン挿入ツールを選択します。

ライン等挿入ダイアログが選択されたラインタブと一緒に表示されます。


ライン等挿入ダイアログ

このダイアログを使用して，新しいライン等(ライン，曲線，円弧)をデータベースに挿入します。

このダイアログを呼び出すには，次の1つを行ないます。

ライン	ライン挿入ツールを選択します。 挿入／ラインを選択します。
曲線	曲線挿入ツールを選択します。 挿入／曲線を選択します。
円弧	円弧挿入ツールを選択します。 挿入／円弧を選択します。

ライン等挿入ダイアログが，選択された適切なタブと一緒に表示されます。

グラフィック画面の適切な位置をクリックするフィールド記入を使用するか，またはキーボードから詳細を入力してダイアログを完了してください。ライン等をすぐに追加するには，�終了�ポイントフィールドにいるときに，グラフィック画面をダブルクリックしてください。

ライン等のタイプはいつでも変更できます。この場合，ライン，曲線，円弧，またはどんな組み合わせでも，次々に接続することができます。

データベースには，3種類のライン等を追加することができます。

ライン

円弧

曲線

挿入

プロジェクトにライン等を追加するダイアログを表示し，その後も新しいライン等を追加するためにダイアログを開いたままにするには，挿入をクリックします。

�開始ポイント�の値は�終了ポイント�の値となり，次のライン等を作成する際に使用できるようになります。


ライン－概要

詳細情報

利用方法	ダイアログ	関連項目
概要

Trimble Geomatics Office 上で，ポイント間にラインを挿入することができます。プロジェクトにラインを挿入し，ライン境界線を決定してください(例：フェンス・ライン，建物，パイプラインの境界線等)。

ラインは，平面図でプロジェクトを表示した場合に，グラフィックウィンドウに表示されます。ラインの詳細を表示するには，ラインを選択してプロパティウィンドウを開いてください。

ラインは，それぞれのラインスタイルに準じて表示されます。ラインスタイルは，Trimble ラインスタイルを使用するか，もしくは自分でスタイルを作成することもできます。

ラインは他のフォーマットにエクスポートすることもできます(AutoCADまたはTRIMMAPフォーマット等)。


円弧－概要

詳細情報

利用方法	ダイアログ	関連項目
概要

ポイント間には，滑らかな円弧を作成することができます。

円弧は，平面図でプロジェクトを表示した場合に，グラフィックウィンドウに表示されます。円弧の詳細を表示するには，円弧を選択してプロパティウィンドウを開いてください。

円弧は，それぞれのラインスタイルに準じて表示されます。ラインスタイルには，Trimble ラインスタイルを使用するか，もしくは自分でスタイルを作成することもできます。

円弧は他のフォーマットにエクスポートすることもできます(AutoCADまたはTRIMMAPフォーマット等)。


曲線－概要

詳細情報

利用方法	ダイアログ	関連項目
概要

曲線を挿入し，ポイント間に最適にフィットする曲線を作成します。曲線によって，直線的でない境界線を決定します(水際や山道等)。

曲線は，平面図でプロジェクトを表示した場合に，グラフィックウィンドウに表示されます。

曲線は，それぞれのラインスタイルに準じて表示されます。ラインスタイルには，Trimble ラインスタイルを使用するか，もしくは自分でスタイルを作成することもできます。

既存の曲線によって使用されているポイントから始まる新しい曲線を挿入するたびに，Trimble Geomatic Office ソフトウェアは既存の曲線を計算しなおし，常に滑らかな曲線を表示します。

曲線は他のフォーマットにエクスポートすることもできます(AutoCADまたはTRIMMAPフォーマット等)。


ライン等挿入ダイアログ -ラインタブ
ライン等挿入ダイアログ－ラインタブ

このダイアログを使用して，データベースにラインを挿入します。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／ラインを選択します。

ライン挿入ツールを選択します。

ライン等挿入ダイアログが，選択されたラインタブと一緒に表示されます。

開始ポイント

次の1つを行ないます。

グラフィック画面の適切な位置をクリックするフィールド記入を使用し，ラインを定義するのに使用する最初のポイントを選択します。

ラインを定義するのに使用する最初のポイントに，ポイント名を記入します。

終了ポイント

次の1つを行ないます。

グラフィック画面の適切な位置をクリックするフィールド記入を使用し，ラインを定義するのに使用する2番目のポイントを選択します。

ラインを定義するのに使用する2番目のポイントに，ポイント名を記入します。

レイヤー

次の1つを行ないます。

ラインを追加したいレイヤーを選択します。

新しいレイヤー作成のために，新しいレイヤー名を入力します。新しいレイヤーダイアログが表示されます。

ラインスタイル

ラインを表示するのに使用したいラインスタイルを選択します。ここで使用できるラインスタイルは，CADスタイルダイアログにあるスタイルです。

挿入

ラインを挿入するには，挿入をクリックします。標準で，終了ポイント・フィールドで選択されたポイントは，次の開始ポイント・フィールドとして選択されます。これは必要に応じて変更することができます。

閉じる

ラインの挿入を中止するには，閉じるをクリックします。


円弧コマンド

このコマンドを使用して，データベースに円弧を挿入します。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／円弧を選択します。

円弧挿入ツールを選択します。

ライン等挿入ダイアログが選択された円弧タブと一緒に表示されます。


ライン等挿入ダイアログ -円弧タブ
ライン等挿入ダイアログ－円弧タブ

このダイアログを使用して，データベースに円弧を挿入します。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／円弧を選択します。

円弧挿入ツールを選択します。

ライン等挿入ダイアログが，選択された円弧タブと一緒に表示されます。

開始ポイント

次の1つを行ないます。

フィールド記入を使用し，適切なポイントをクリックします。

キーボードを使用して，ポイント名を入力します。

終了ポイント

次の1つを行ないます。

フィールド記入を使用し，適切なポイントをクリックします。

キーボードを使用して，ポイント名を入力します。

中心点

既存のポイントを円弧の中心点として使用するには，次の1つを行います。

既存のポイント名を入力します。

グラフィック画面の適切な位置をクリックするフィールド記入を使用し，既存のポイントを選択します。

ポイントの座標は，中心の北距および東距フィールドにコピーされます。

北距，東距

円弧の中心点として座標を使用する場合には，グラフィック画面の適切な位置をクリックするフィールド記入を使用して，グラフィックウィンドウ内で位置をクリックします。座標がこれらのフィールドにコピーされます。

ノート：中心点と中心座標の両方を入力した場合，中心点の値が優先して使用されます。

小さい円弧

小さい円弧を作成したい場合は，Trueオプションを選択してください。そうでない場合は，Falseオプションを選択してください。2つのポイント間で形成される円弧には，円を定義する上で常に2種類の円弧の軌跡が想定されます。この設定により，どちらの想定軌跡を使用して円弧を作成するかを決定します。これは以下の図で説明されます。

ノート：円弧の中心とは，2点間を結ぶ直線の中心点，もしくは中心となる北距と中心となる東距から導き出された座標です。

レイヤー

次の1つを行ないます。

円弧を追加したいレイヤーを選択します。

新しいレイヤー作成のために，新しいレイヤー名を入力します。新しいレイヤーダイアログが表示されます。

ラインスタイル

円弧を表示するのに使用したいラインスタイルを選択します。ここで使用できる円弧スタイルは，CADスタイルダイアログにあるスタイルです。

挿入

円弧を挿入するには，挿入をクリックします。標準で，終了ポイント・フィールドで選択されたポイントは，次の開始ポイント・フィールドとして選択されます。これは必要に応じて変更することができます。

閉じる

円弧の挿入を中止するには，閉じるをクリックします。


曲線コマンド

このコマンドを使用して，データベースに曲線を挿入します。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／曲線を選択します。

曲線挿入ツールを選択します。

ライン等挿入ダイアログが選択された曲線タブと一緒に表示されます。


ライン等挿入ダイアログ -曲線タブ
ライン等挿入ダイアログ－曲線タブ

データベースに曲線を挿入する場合に，このダイアログを使用してください。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／曲線を選択します。

曲線挿入ツールを選択します。

ライン等挿入ダイアログが，選択された曲線タブと一緒に表示されます。

開始ポイント

次の1つを行ないます。

フィールド記入を使用し，適切なポイントをクリックします。

キーボードを使用して，ポイント名を入力します。

終了ポイント

次の1つを行ないます。

フィールド記入を使用し，適切なポイントをクリックします。

キーボードを使用して，ポイント名を入力します。

入射角，出射角

曲線を定義するポイントを基にして自動的に接線値を入力するには，値を<自動>のままにしておきます。しかし，必要な場合は自分で接線値を入力することもできます。

曲率

0から1の間の値を入力します。曲率とは，曲線にどれだけの幅があるかを定義する率です。

この曲率値が高ければ高いほど，曲線の幅は大きくなります。

レイヤー

次の1つを行ないます。

曲線を挿入したいレイヤーを選択します。

新しいレイヤー作成のために，新しいレイヤー名を入力します。新しいレイヤーダイアログが表示されます。

ラインスタイル

曲線を表示するのに使用したいラインスタイルを選択します。ここで使用できるラインスタイルは，CADスタイルダイアログにあるスタイルです。

挿入

曲線を挿入するには，挿入をクリックします。標準では，終了ポイント・フィールドで選択されたポイントは，次の開始ポイント・フィールドとして選択されます。これは必要に応じて変更することができます。

閉じる

曲線の挿入を中止するには，閉じるをクリックします。


テキストコマンド

テキスト挿入ダイアログを開くには，このコマンドを使用します。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／テキストを選択します。

テキスト挿入ツール [image] をクリックします。


テキスト挿入ダイアログ

このダイアログを使用して，データベースに新しいテキストを挿入します。

このダイアログを呼び出すには，平面図から，次の1つを行います。

挿入／テキストを選択します。

テキスト挿入ツール [image] をクリックします。

テキスト表現

表示したいテキストを入力します。フィールドコードを使用するには(例：プロジェクト・タイトル等)，右クリックをして，ショートカット・メニューからフィールドを選択してください。

北距

テキスト位置の北距値を入力するには，次の1つを行います。

グラフィックウィンドウ内の位置をクリックして，フィールド記入を使用します。

キーボードを使用して，北距の値を挿入します。

東距

テキスト位置の東距値を入力するには，次の1つを行います。

グラフィックウィンドウ内の位置をクリックして，フィールド記入を使用します。

キーボードを使用して，東距の値を挿入します。

方位オフセット

テキストエンティティのための方位オフセットを入力します。方位オフセットを特定しない場合，テキストはウィンドウに水平に表示されます。

固定タイプ

北距および東距の値に基づいて，テキストの位置を特定します。リストから値を選択してください。

レイヤー

リストから，テキストを追加したいレイヤーを選択します。新しいレイヤーにテキストを入力するには，新しい名前を入力してください。新しいレイヤーダイアログが表示されます。

テキストスタイル

リストから，テキストエンティティ用のテキストスタイルを選択します。追加するレイヤーに標準設定されたテキストスタイルを使用したい場合は，<レイヤーで>オプションを選択してください。

テキストスタイルを編集もしくは作成する場合は，編集／スタイルを選択します。

挿入

プロジェクトにテキストを追加するダイアログを表示し，その後も他のテキストを追加するためにダイアログを開いたままにするには，挿入をクリックします。


テキスト－概要

詳細情報

利用方法	ダイアログ	関連項目
概要

プロジェクトには，図の説明やプロジェクトのヘディング表示などのテキストを追加することができます。

このテキストは，グラフィックウィンドウに表示されます。テキストの詳細を表示するには，テキストを選択してプロパティウィンドウを開いてください。テキストは，グラフィックウィンドウ内の別の場所にドラッグすることだけでなく，テキストの回転をすることもできます。

テキストは他のフォーマットにエクスポートすることもできます(AutoCADまたはTRIMMAPフォーマット等)。


注釈－概要

詳細情報

利用方法	ダイアログ	関連項目
概要

注釈とは，各種エンティティ(ポイント，ライン，円弧)に付属するテキストのことを言います。表示されるテキストは，注釈テンプレートによって定義されます。

注釈テンプレートは，次の項目を定義します。

何に注釈をつけるか

エンティティに関連した注釈の位置

注釈テンプレートには，ユーザー定義されたテキストとフィールドコードの組み合わせたものを使用することができます。フィールドコードは，注釈のついたフィールドに変更が加えられるたびに展開されます。例えば，標高が注釈についたポイントがあったとして，そのポイントの標高が変更された場合，注釈の内容も更新されます。

こうした注釈は，全てプロジェクトに保存されます。

注釈テンプレート

Trimble では，すでに定義された注釈テンプレートをいくつか用意してあります。特徴コードを処理した場合で，特徴・属性ライブラリに注釈テンプレートが含まれている場合，それらはこの注釈テンプレート・リストに追加されます。特徴・属性ライブラリの注釈テンプレートにはテキストスタイル設定がないため，ここからTrimble Geomatics Office プロジェクトに注釈テンプレートが追加された場合は，初期設定で標準のテキストスタイルが使用されるようになっています。

注釈の追加

注釈を追加するには，平面図から次の1つを行います。

挿入／注釈を選択します。

編集／注釈テンプレートを選択します。新規をクリックします。

特徴コード処理を使用して，エンティティに注釈をつけます。詳細に関しては，Trimble Feature and Attribute Editor ユーティリティのヘルプを参照してください。

ノート：既存の注釈を編集するには，プロパティウィンドウを使用します。


注釈コマンド

このコマンドは，選択したポイント，ライン，円弧に注釈をつけるのに使用します。

このコマンドを呼び出すには，挿入／注釈を選択します。

注釈ダイアログが表示されます。


注釈ダイアログ

概要と詳細

このダイアログは，選択したポイント，ライン，円弧に注釈をつけるのに使用します。

このコマンドを呼び出すには，挿入／注釈を選択します。

紙サイズのエンティティに関する注釈の挿入位置は，エンティティの大きさとファイル／ページ設定内の縮尺の設定を参照して定義されます。注釈と注釈エンティティの間には，フォントサイズの3分の1の空白スペースが付加されます。

注釈テンプレート

リストからテンプレートを選択してください。

既存の注釈はそのまま

これから注釈をつけるエンティティにすでに存在している注釈もそのまま残したい場合は，このチェックボックスを選択します。この場合，新しい注釈は既存の注釈に追加される形でつけられます(これは，同じ位置におかれた場合でも変わりません)。

ヒント：この機能を使用すると，注釈テンプレートダイアログで別々のレイヤーに分散された，複数の注釈をつけることができます。

このチェックボックスを空白にした場合，新しい注釈を加えると，同じエンティティにそれ以前につけられていた注釈は削除されます。

注釈

エンティティに注釈をつけるには，2つの方法があります。

選択	選択したエンティティに注釈をつける場合は，このオプションを選択します。
データベース全体	全てのエンティティに注釈をつける場合は，このオプションを選択します。
何も選択されていない場合は，これらのボタンは使用できません。この場合，全てのエンティティに注釈がつけられます。

削除

選択したエンティティの全ての注釈を削除するには，次の1つを行います。

削除をクリックします。

削除したい注釈を選択し，編集／削除を選択します。

テンプレート

テンプレートをクリックし，注釈テンプレートを表示します。このダイアログを使用して，作成，変更もしくは削除したい注釈テンプレートを選択します。詳細に関しては，注釈テンプレートダイアログを参照してください。


注釈テンプレートダイアログ

概要と詳細

このダイアログは，注釈テンプレートを管理するのに使用します。

このダイアログを呼び出すには、

1.	挿入／注釈を選択します。

2.	テンプレートをクリックします。

注釈テンプレートは，1つもしくはそれ以上の注釈のスタイル，位置，内容を定義します。そして，一度つけられた注釈は，注釈テンプレートから独立した，個別のテキスト情報になります。こうした注釈は，全てプロジェクトに保存されます。

Trimble Geomatic Office ソフトウェアは，注釈の表示する値を特定するために，フィールドコードを使用します。注釈は一過性のものです－すべてのフィールドはその親エンティティが変更する度に更新されます。

注釈テンプレート

このリストには，プロジェクトで現在使用されている全ての注釈テンプレートが含まれています。

既存の注釈テンプレートを変更もしくは削除するには，変更もしくは削除したいテンプレート名をハイライトしてください。

新規

新しい注釈テンプレートを作成するには，新規をクリックしてください。注釈テンプレートダイアログが表示されます。

編集

既存の注釈テンプレートを編集するには，編集をクリックしてください。注釈テンプレートダイアログが表示されます。

削除

選択した注釈テンプレートを削除するには，削除をクリックしてください。これで選択した注釈テンプレートがプロジェクトから削除されます。


注釈テンプレートダイアログ

概要と詳細

このダイアログのタブを使用して，作成もしくは変更された注釈テンプレートを設定します。

このダイアログを呼び出すには、

1.	次の1つを行ないます。

挿入／注釈を選択します。テンプレートをクリックします。

編集／注釈テンプレートを選択します。

注釈テンプレートダイアログが表示されます。

2.	新規もしくは編集をクリックします。

次の4つのタブを使用して，注釈テンプレートを定義します。

設定

ポイント

ライン

円弧


注釈テンプレ-ト ダイアログ -設定タブ
注釈テンプレートダイアログ－設定タブ

概要と詳細

設定タブを使用して，注釈テンプレートの全般設定を編集します。

このタブを呼び出すには、

1.	挿入／注釈を選択します。

2.	テンプレートをクリックします。

3.	新規もしくは編集をクリックします。

4.	設定タブを選択します。

名前

表示するテンプレートの名前を入力するか，既存のテンプレートの名前を変更します。

テキストスタイル

注釈のテキストスタイルを定義します。

注釈のテキストスタイルを定義するには，平面図から編集／スタイルを選択します。<レイヤーで>オプションを選択した場合，そのテキストスタイルは注釈が追加されたレイヤーのテキストスタイル設定にも渡されます。

レイヤーの標準を設定するには，平面図から編集／レイヤーを選択してください。

ポイント注釈回転

必要なポイント注釈回転を入力してください。回転には 00ｰ00'00" から 360ｰ00'00" までが使用できます。初期設定は90ｰ00'00"です。

レイヤー

指定レイヤー	特定のレイヤーを指定して注釈を配置する場合には，このオプションを使用します。指定するレイヤーの選択は，リスト内の既存のレイヤーを選択するか，または新しいレイヤー名を入力することで行います。新しいレイヤー名を入力した場合，このレイヤーはテンプレートが適応された時に自動的に作成されます。

現在のレイヤー	現在のレイヤーを指定して注釈を配置する場合には，このオプションを使用します。現在のレイヤーは，平面図のレイヤー選択ツールおよびレイヤー・ダイアログに表示されます。

注釈付のエンティティレイヤー

注釈付のエンティティレイヤーを指定して注釈を配置する場合には，このオプションを使用します。


注釈テンプレートダイアログ－ポイントタブ

概要と詳細

このテンプレートを使用してポイントに注釈をつける場合に，ポイントタブを使用してポイントに対する注釈を定義します。

このタブを呼び出すには、

1.	挿入／注釈を選択します。

2.	テンプレートをクリックします。

3.	新規もしくは編集をクリックします。

4.	ポイントタブを選択します。

4箇所(左，オン，右，フローティング)につけられる注釈テキストは，それぞれ英数字で最大100文字まで書き込むことができます。それぞれの位置の値は，ユーザー定義されたテキストとフィールドコードで構成されています。フィールドコードは，データベースから注釈の詳細を引き出すために使用されます。例えば，名前でポイントに注釈をつけるように名前のフィールドコードが使用される場合(このケースではポイントの右側)。

ポイントに注釈をつけるには，4つの標準位置のどれを使用しても，どの組み合わせで使用しても(複数使用の場合)かまいません。注釈を標準指定の位置から移動させるには，マウスを使用して，注釈をより適切な位置へドラッグしてください。移動した場合でも，注釈とポイントとのリンクは維持されます。

場所	注釈の表示位置：

左	ポイントの左側。

上	ポイントの上。

右	ポイントの右側。

フロート	ポイントとは重ならない場所。しかしリンクしている。


注釈テンプレ-ト ダイアログ -ラインタブ
注釈テンプレートダイアログ－ラインタブ

このテンプレートを使用してラインに注釈をつける場合に，ラインタブを使用してラインに対する注釈を定義します。

このタブを呼び出すには、

1.	挿入／注釈を選択します。

2.	テンプレートをクリックします。

3.	新規もしくは編集をクリックします。

4.	ラインタブを選択します。

7箇所につけられる注釈テキストは(以下を参照)，それぞれ英数字で最大100文字まで書き込むことができます。それぞれの場所の値は，ユーザー定義されたテキストとフィールドコードで構成されています。フィールドコードは，データベースから注釈の詳細を引き出すために使用されます。例えば，ラインに方位角(このケースではラインの中心上)の注釈をつけるために方位角フィールドコードが使用された場合と，ラインに距離(このケースではラインの中心下)の注釈をつけるために距離フィールドコードが使用された場合。

ラインに注釈をつけるには，7つの標準位置のどれを使用しても，どの組み合わせで使用しても(複数使用の場合)かまいません。注釈を標準指定の位置から移動させるには，マウスを使用して，注釈をより適切な位置へドラッグしてください。移動した場合でも，注釈とラインとのリンクは維持されます。

場所	注釈の表示位置：

左上	ラインの左上端

上	ラインの中心上

右上	ラインの右上端

左下	ラインの左下端

下	ラインの中心下

右下	ラインの右下端

フロート	ラインとは重ならない場所。しかしリンクしている。


注釈テンプレ-ト ダイアログ -円弧タブ
注釈テンプレートダイアログ－円弧タブ

このテンプレートを使用して円弧に注釈をつける場合に，円弧タブを使用して円弧に対する注釈を定義します。

このタブを呼び出すには、

1.	挿入／注釈を選択します。

2.	テンプレートをクリックします。

3.	新規もしくは編集をクリックします。

4.	円弧タブを選択します。

7箇所につけられる注釈テキストは(以下を参照)，それぞれ英数字で最大100文字まで書き込むことができます。それぞれの場所の値は，ユーザー定義されたテキストとフィールドコードで構成されています。フィールドコードは，データベースから注釈の詳細を引き出すために使用されます。例えば，円弧に長さ(このケースでは円弧の中心上)の注釈をつけるために長さフィールドコードが使用された場合と，円弧に半径(このケースでは円弧の中心下)の注釈をつけるために半径フィールドコードが使用された場合。

円弧に注釈をつけるには，7つの標準位置のどれを使用しても，どの組み合わせで使用しても(複数使用の場合)かまいません。注釈を標準指定の位置から移動させるには，マウスを使用して，注釈をより適切な位置へドラッグしてください。移動した場合でも，注釈と円弧とのリンクは維持されます。

場所	注釈の表示位置：

左上	円弧の左上端

上	円弧の中心上

右上	円弧の右上端

左下	円弧の左下端

下	円弧の中心下

右下	円弧の右下端

フロート	円弧とは重ならない場所。しかしリンクしている。


ポイントコマンド

このコマンドを使用して，データベースに新しいポイントを挿入します。

このコマンドを呼び出すには，挿入／ポイントを選択します。

ポイント挿入ダイアログが表示されます。


プロジェクトへのエンティティの追加

プロジェクトへのエンティティの追加は，Trimble Geomatics Office を通じて行うことができます。エンティティとは，ポイント，ライン，円弧，曲線，注釈，テキストのことです。これら全ての種類のエンティティは，平面図表示の挿入メニューを使用して追加することができます。また，測量表示の場合でも挿入メニューを使用してポイントを追加することができます。

エンティティの各種類に関する詳細は，以下のリンクを参照してください：

ポイント

ライン

円弧

注釈

テキスト


現在の観測にライン等コマンド

このコマンドを使用して，選択した観測タイプにCADライン等を作成します。このコマンドを呼び出すには，平面図で挿入／現在の観測のライン等を選択してください。

現在の観測にライン等挿入ダイアログが表示されます。


現在の観測にライン等挿入ダイアログ

このダイアログを使用して，プロジェクト内の全ての観測にCADラインを作成します。

このダイアログを呼び出すには，平面図で挿入／現在の観測のライン等を選択してください。

観測タイプ

観測タイプを表示します。可能なタイプは以下のとおりです。

RTKベクトル
後処理ベクトル	静止，高速静止および後処理キネマティック
一般測量機観測	一般測量機，レーザー，測距儀およびレベル
CADレイヤー

観測タイプにラインを追加するレイヤーを選択します。ラインは，選択したレイヤーに設定された標準のラインスタイルで描かれます。新しいレイヤーをキーボードを使用して入力すると，新しいレイヤーダイアログが表示されます。


プロジェクトプロパティ－概要

詳細情報

利用方法	ダイアログ
概要

プロジェクトプロパティには，プロジェクト全般の設定があります(例えば，座標系と表示単位)。いつでも変更することができます。プロジェクトプロパティを変更すると，プロジェクトは変更内容を反映するため更新されます。プロジェクトプロパティによっては，プロジェクトデータを変更します(例えば，座標系の変更)。既存データを変更するプロジェクトプロパティを変更する場合は注意してください。

プロジェクトプロパティの変更は元に戻せません。


プロジェクトプロパティダイアログ

このダイアログを使用して，プロジェクト全般の設定をします。

これを呼び出すには、

ファイル/プロジェクトプロパティを選択します。

プロジェクトプロパティダイアログには次のタブがあります。

座標系タブ

レポートタブ

プロジェクト詳細タブ

再計算タブ

単位とフォーマットタブ

特徴タブ


プロジェクトプロパティダイアログ－プロジェクト詳細タブ

このタブを使用して，レポートやプロットに記述したいプロジェクト/テンプレートに関するデータを入力します。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。ダイアログが表示されます。

2.	プロジェクト詳細タブを選択します。

ノート：プロジェクト詳細リストで右クリックすると，名前の変更，既存の項目の削除，新しい項目の追加などのショートカットメニューが表示されます。

このタブのすべてのフィールドはオプションです。

タイトル

現在のプロジェクト/テンプレートのタイトルをこのフィールドに入力します。

説明

必要であれば，現在のプロジェクト/テンプレートの説明を入力します。

リファレンス

プロジェクトとオフィスの原価計算をリンクするため，プロジェクトのリファレンス番号を入力します。

測量士

必要であれば，プロジェクトの現場作業を行った測量士の名前を入力します。

コンピュータオペレータ

必要であれば，プロジェクトのコンピュータ操作をした人の名前を入力します。

日付

標準設定では，このフィールドにプロジェクトの作成日を記録します。これは，テンプレートプロジェクトにあるこのフィールドの日付フィールドコードを使用して自動的に設定されます。

垂直測地系

垂直測地系の名前を入力します。

機器

機器のシリアル番号を入力します。

ノート：テンプレートがオープンされても，フィールドコード定義は展開されません。この機能を使用して，適合するフィールドコード定義をテンプレートに入力できます。プロジェクトがはじめてオープンされたとき，フィールドコード定義が展開されます。


プロジェクトプロパティダイアログ－座標系タブ

概要と詳細

このタブを使用して，プロジェクトの座標系を選択したり表示したりします。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブを選択します。

座標系設定

このグループは現在の座標系の概要を表示します。プロジェクトのサイト，座標系，ゾーン，測地系，ジオイドモデルを表示します。

変更ボタンで座標系選択ダイアログ

が開きます。このダイアログは座標系を選択するウィザードの最初のページです。

ノート：座標系を作成・編集するには，Trimble 座標系マネージャユーティリティを使用します。

ローカルサイト設定

このグループはサイトの位置の概要を表示します。プロジェクトの緯度，経度，高度，座標の表示方法を表示します。

変更ボタンでローカルサイト設定ダイアログが開きます。このダイアログでプロジェクトの位置を変更し，使用したい地表座標を指定できます。

詳細

詳細ボタンは座標系の詳細ダイアログを開きます。このダイアログを使用して現在の座標系の投影，測地系変換，調整，ジオイドモデル，ローカルサイトのすべてのパラメータを表示します。

投影でGPS サイトキャリブレーションを行った場合，座標系の詳細は，基本の座標系とGPS サイトキャリブレーション(平面調整と高度調整)パラメータの組み合わせになります。I

網平均を行った場合，パラメータは調整として使用されます。

座標系はサイトキャリブレーション，または網平均変換パラメータのいずれかを使用します。両方は使用できません。

サイトに名前をつけて保存

サイトに名前をつけて保存ボタンでサイトに名前をつけて保存ダイアログが開きます。このダイアログを使用して，座標系の詳細(現在のGPS サイトキャリブレーションを含む)をサイト定義として座標系データベースに保存します。

いったんサイトに名前をつけると，今後のプロジェクトの座標系定義に使用することができます。サイトを編集するには，Trimble 座標系マネージャユーティリティを使用します。

ノート：網平均変換パラメータはサイトに保存されません。


座標系詳細ダイアログ－投影タブ

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブで詳細をクリックします。座標系詳細ダイアログが表示されます。

3.	投影タブを選択します。

投影パラメータを表示するにはこのタブを使用します。投影タイプ(例えば，横メルカトール，ランベルト)を表示します。表示されるフィールドは投影法によって異なります。

南方位フィールドは方位の基準を示します。ほとんどの国は北を方位の基準に使用します(北=0ｰ)。しかし南アフリカとかハワイとかのある地域では，南を方位の基準に使用します(南=0ｰ)。この方法を使用する地域で作業する場合，座標系マネージャウィザードやTrimble 座標系マネージャユーティリティで南方位を設定するときにこのボックスを選択します。

プラスの北/南と東/西オプションは座標が大きくなる方向を示します。


座標系詳細ダイアログ -測地系変換タブ
座標系詳細ダイアログ－測地系変換タブ

関連項目

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブで詳細をクリックします。座標系詳細ダイアログが表示されます。

3.	測地系変換タブを選択します。

測地系変換タブを表示するには，このタブを使用します。WGS-84 楕円体からローカル楕円体に変換する変換方法とパラメータを表示します。ローカル楕円体パラメータはローカル楕円体グループに表示されます。

測地系変換オプションで表示されるパラメータは､

Molodensky(3パラメータ)

7パラメータ

Multiple regression

測地グリッド

下のテーブルは各オプションで表示されるフィールドを示します。


座標系詳細ダイアログ－調整タブ

このタブを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブで詳細をクリックします。座標系詳細ダイアログが表示されます。

3.	調整タブを選択します。

調整パラメータを表示するには，このタブを使用します。調整は，測量データに適用されるサイトキャリブレーション，または網平均変換のパラメータで，下から求められます。

計算したGPS サイトキャリブレーション

Survey Controller(*.dc)ファイルからインポートしたキャリブレーション

サイト定義

網平均(網平均モジュールがインストールされている場合)

ノート：キャリブレーション高度調整グループの傾斜北および傾斜東は10万分の1(ppm )で表示されます。


座標系詳細ダイアログ－ジオイドモデルタブ

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブで詳細をクリックします。座標系詳細ダイアログが表示されます。

3.	ジオイドモデルタブを選択します。

ジオイドモデルの詳細を表示するにはこのタブを使用します。GPS 位置の標高を決定するために使用されるジオイドモデルの名前と定義ファイルを表示します。

ノート：ジオイドモデルの質を表示するには，プロジェクト/再計算タブを使用します。


座標系詳細ダイアログ－ローカルサイトタブ

このタブを使用して，ローカルサイトの詳細を表示します。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブで詳細をクリックします。座標系詳細ダイアログが表示されます。

3.	ローカルサイトタブを選択します。

このタブは下の内容を表示します。

プロジェクトの位置の緯度，経度，高度

地表縮尺係数，偽北距オフセット，偽東距オフセットと地表座標が使用されているかどうか


ローカルサイト設定ダイアログ

ローカルサイト設定ダイアログを使用してプロジェクトの位置を指定し，プロジェクトで地表座標を使用するかどうか指定します。このダイアログを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブを選択します。

3.	ローカルサイト設定グループから変更をクリックします。

プロジェクトの位置

このグループを使用してプロジェクトの中央のポイントを入力し，プロジェクトの位置を定義します。プロジェクトの位置はグリッド，ローカル，WGS-84 の座標で設定できます。

ノート：グラフィックウィンドウで位置を選択するとグリッド座標を入力できます。

プロジェクトの開始時にプロジェクトの位置を定義してください。ソフトウェアはこの情報を計算に使用します。それは､

プロジェクトの緯度を使用して地球半径を計算する

プロジェクトの緯度と経度を使用してグリッド縮尺係数を定義する

プロジェクトの高度を標準標高として使用し標高係数を計算する

座標系が定義されていない場合，標準の投影定義ダイアログが表示されます。地表座標使用オプションを選択する前に，原点の緯度と経度を入力してください。

地表座標使用

プロジェクトで地表座標を使用したい場合，このボックスを選択します。しかし，プロジェクトの座標系を定義し，位置を指定しているかはじめに確認してください。

このチェックボックスが選択されている場合，地表座標使用グループのすべての項目が使用可能になります。ローカルサイト設定ダイアログをはじめて使用する場合，プロジェクトの位置から縮尺係数計算チェックボックスはチェックされていません。

ノート：プロジェクトの位置グループで北距，東距，標高フィールドが入力されている場合，ソフトウェアは地表縮尺係数のみ，計算できます。

ノート：GPS サイトキャリブレーションを行なってから地表座標使用チェックボックスを選択すると，プロジェクトで定義されたキャリブレートは無効になります。操作を続けるとキャリブレーションが削除されます，という警告メッセージが表示されます。

地表座標表示

地表座標表示オプションにより，Trimble Geomatics Office プロジェクトで地表座標が表示される方法を変更できます。この変更は，投影座標と地表座標間の識別を簡単にします。下のひとつを選択します。

北距オフセット/東距オフセット�表示される座標にオフセットを追加します

4桁の座標�地表座標の表示で4桁の数値を表示します。例えば，プロジェクト座標が264150.000 の場合，地表座標は4510.000 と表示されます。

5桁の座標�地表座標の表示で5桁の数値を表示します。例えば，プロジェクト座標が264150.000 の場合，地表座標は64510.000 と表示されます。


サイトに名前をつけて保存ダイアログ

このダイアログを使用して，現在の座標系をサイトとして保存します。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	サイトに名前をつけて保存をクリックします。

サイト名

保存するサイト定義の名前を入力します。

OK

OKをクリックしてサイトを保存します。サイトは座標系データベースに保存されます。保存したすべてのサイトはTrimble 座標系マネージャ�ユーティリティのサイトタブに表示されます。サイト定義は今後のプロジェクトの座標系として使用できます。

ヒント：座標系マネージャユーティリティを使用するとき，サイトタブをクリックします。サイトが青色で表示されます。

ノート：網平均変換パラメータはサイトとして保存できません。


プロジェクトプロパティダイアログ－単位とフォーマットタブ

このタブを使用して，Trimble Geomatics Office の全般(画面表示，インポート，エクスポート，レポートなど)で使用される単位の値を設定します。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	単位とフォーマットタブを選択します。

座標

座標(北距と東距)の表示単位を設定します。オプションは国際フィート，Links，メートル，US測量フィート，Nabimian メートルです。

標高 / 楕円体高

標高の表示単位を設定します。オプションは国際フィート，Links，メートル，US測量フィート，Nabimian メートルです。

座標の小数点以下桁数

座標の表示する小数点以下の桁数を設定します。5桁まで指定できます。

座標順

座標の順序を設定します。オプションは北からと東からです。

カーソルの位置の表示

ステータスバーのカーソル位置の表示を設定します。オプションはグリッド，ローカル緯度経度，WGS 緯度経度です。

距離

距離の表示を設定します。オプションはChains，国際フィート，国際マイル，キロメートル，Links，メートル，US測量フィート，Nabimian メートルです。

距離の小数点以下桁数

距離の小数点以下の桁数を設定します。5桁まで指定できます。

表示距離

表示される距離のタイプを設定します。オプションは､

楕円体距離(海面高距離)

これは準拠楕円体の表面上(高さ0 )で計算されたデータベースの2点間の距離です。

グリッド距離

これは2つの終点の投影座標間のピタゴラスの距離です。つまり，投影調整が適用されてないということは，ラインへの投影の縮尺係数は適用されていないことを意味します。

地表距離

これは楕円体高の平均で計算された，楕円体と平行な距離です。つまり，数学的に計算された，両端の点の平均高度に調整された楕円体上の距離です。地表距離が使用される場合，グリッド距離は地表距離と等しいはずです。これは下のように説明されます。

ここで

H	データベースの高さ

R	地球の半径

DE	楕円体距離

面積

面積の表示単位を設定します。オプションはエイカー，ヘクター，平方フィート，平方メートルです。

面積の小数点以下桁数

面積を表示する小数点以下の桁数を設定します。5桁まで指定できます。

角度単位

すべての水平方向，および方位角に使用される角度の単位を設定します。オプションは度，Grads，Mils  です。

角度フォーマット(度)

度の場合の角度，あるいは方位角のフォーマットを設定します。オプションは､

DDD.dddd	度の小数

DDDMM'SS	度，分，秒

DDDMM'SS.s	度，分，秒の小数

DDDMM.mm	度，分の小数

角度フォーマット(grads /mils )

grads またはmils の場合の角度，または方位角のフォーマットを設定します。オプションは小数点以下3桁，4桁，5桁です。

方位角フォーマット

方位角の値のフォーマットを設定します。オプションは､

4象限方向(N62ｰ07'40"W と表わされます)

正円(297ｰ52'20"と表わされます)

WGS-84 表示

WGS の表示をオプションL，L，H またはX，Y，Z  に設定します。この設定により，Trimble 座標系マネージャ�ユーティリティを使用してポイントの座標を入力したり編集したりするとき，WGS-84 の座標がポイントのプロパティウィンドウでどのように表示されるか決定します。この設定はまた，カスタムのインポート，レポートエクスポートフォーマットをWGS-84 の値で作成する場合，使用されます。

緯度，経度フォーマット

緯度および経度の値のフォーマットを設定します。オプションは､

DDD.ddddddddd	度の小数

DDDMM'SS.sssss	秒の小数

DDDMM.mmmmmmm	分の小数

縮尺率フォーマット

縮尺率の値の表示と計算法を設定します。オプションは､

1�対X ft	インペリアル(Imperial )計測単位

1:X	メートル計測単位

1000毎の区切り表示

1000毎の区切り表示を設定します。

オプションははいといいえです。はいを選択するとMicrosoft Windows で設定されている1000毎の区切り文字が数値に適用されます。詳しくはMicrosoft Windows コントロールパネルの地域のオプションをご覧ください。

ノート：この表示設定がはいに設定されているとき，インポートされるASCII ファイル，エクスポートされるASCIIファイル，レポートに1000毎の区切り文字があるものとされます。これはファイルのインポートが失敗したり，エクスポートフォーマットが思ったとおりのフォーマットにならない原因になる可能性があります。(例えば，1000毎のカンマ区切り文字を使用した数値のカンマ区切りのファイルについて考えてみてください。)フィールドコードの修飾子�標準�をフォーマット定義で使用して，数値の取り扱いから強制的に1000毎の区切り文字をなくし，常に小数点は小数点であるようにすることができます。

表示単位

座標の単位がプロパティウィンドウやステータスバーで表示されるかどうかを決定します。標準設定ははいです。

ヌル表示

ヌルの値の表示を設定します。

最初の自動ポイント名

最初の自動ポイント名を設定します。この値は，ソフトウェアで座標が追加されたり作成されたりする時に使用されます。ポイント名は自動的に大きくなります。

勾配フォーマット

勾配のフォーマットを設定します。Trimble RoadLink�ソフトウェアで表示され使用されます。オプションはパーセントと比率です。

Side Slope 勾配フォーマット

これはTrimble RoadLink ソフトウェアで表示され使用されます。オプションはパーセントと比率です。

比率単位

Trimble RoadLink ソフトウェアで使用され表示される比率フォーマットのオーダーを設定します。オプションは垂直：水平と水平：垂直です。例えば，垂直：水平は1:100 を表示します。水平：垂直は100:1 を表示します。

ステーションフォーマット

Trimble RoadLink ソフトウェア全般のステーションの値の表示フォーマットを設定します。フォーマットオプションは､

1000.0

10+00.0

1+000.0

1/000.0

容積単位

Trimble RoadLink ソフトウェアで使用され表示される容積の単位を設定します。オプションは立方メートル，立方フィート，立方ヤードです。

GPS 時刻表示タイプ

時刻を表示するフォーマットを決定します。オプションは、ローカル時刻、GPS時刻、UTC時刻です。


プロジェクトプロパティダイアログ－レポートタブ

このタブを使用して，プロジェクトのレポートを選択ます。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	レポートタブを選択します。

作成したレポートの表示

作成したレポートの表示オプションはデータインポート，再計算，特徴コード処理などの操作で作成された，すべてのレポートの表示をコントロールします。レポートはこれらの操作について常に作成され，プロジェクトのレポートフォルダーの適切なフォルダーに保存されます。

これらのオプションは，下の処理操作に従ってレポートの表示をコントロールします。

常に	すべての処理によって作成されたレポートは常に表示されます�処理中にエラーも警告もない場合，ヘッダーと処理操作の追加情報だけのレポートが作成されます。
エラー時	何かの処理中にエラーが発生した場合，この処理のレポートがエラーの詳細も含めて自動的に表示されます。
エラー時に確認	何かの処理中にエラーが発生した場合，エラーが発生したことを知らせる警告が表示され，エラーの詳細のレポートを表示することができます。
なし	処理中にエラーが発生しても警告されず，詳細を確認できるレポートも表示されません。
常に確認	処理が行われると必ず，レポートを表示するか，確認の画面が表示されます。


プロジェクトプロパティダイアログ－再計算タブ

このタブを使用して，プロジェクトの再計算設定を設定します。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	再計算タブを選択します。

複数のサイドショット観測

このグループを使用して，複数回観測されたサイドショットポイントの座標を再計算がどのように決定するか指定します。サイドショットポイントとは､

そこから伸びる観測がない

基準座標がない

それに伸びる静止，または高速静止観測がない

最適な観測を使用する

再計算でサイドショットポイントへの観測の平均をしたくない場合，このオプションを選択します。ポイントへの最適な観測はその座標を決定するために使用されます。この設定は標準で選択されています。

同じタイプの観測から平均を計算(GPS，一般測量機，レベル，レーザー)

再計算で同じタイプの各観測から求められた座標を平均したい場合，このオプションを選択します。再計算は異なる観測タイプによって求められた座標は平均しません。例えば，一般測量機観測から決定された座標はGPS 観測によって決定された座標といっしょには平均されません。また，サイドショットだけが平均されます。

許容値チェック

このチェックボックスを選択して，再計算処理中の許容値チェックを使用します。同じタイプの観測から平均を計算オプションが選択されている場合，再計算は許容値を使用して座標の平均を決定します。

測量，マッピング，不明の質の位置の許容値を設定できます。

複数の座標や観測について，あるポイントの較差が表示されているとき，決定に許容値が使用されます。すべての観測や座標から求められた座標が許容値の範囲外である場合，較差がレポートされ警告フラグがポイント上に表示されます。許容範囲外エラーはプロパティウィンドウ/警告ページに表示されます。


水平

座標の水平要素の許容値を入力します。

垂直

座標の垂直要素の許容値を入力します。

一般測量機観測を楕円体上に変換( 標高の補正 )

再計算で一般測量機観測の距離を楕円体上の距離に変換したい場合，このチェックボックスを選択します。

データベースに保存されている現場の距離観測に，既にこの補正が適用されていることがわかっている場合と、入力された座標が地面座標でありグリッド座標でない場合を除いては、標高の補正が適用されるべきです。この補正が適用されず，一般測量機データがある有意な標高で観測された場合，計算された座標は正しくありません。

GPS データは常にWGS-84 楕円体で収集されているので，この補正は適用しません。

ノート：GPSと一般測量を結合する場合には、観測を楕円体上に変換する必要があります。

ノート：単位とフォーマットタブの表示距離をオプションとして使用して，データベースポイント間の距離をどのようにレポートするかコントロールします。このオプションを地表距離に設定する場合，何が観測した任意の地表距離の有効な水平距離要素であるか，を表示します。

詳しくはトピック標高補正をご覧ください。

ジオイドモデルの質

プロジェクトで使用されているジオイドモデルの質を選択します。5m精度の場合，マッピングを選択します。ジオイドモデルが測量の質であることがわかっている場合，測量の質オプションを選択します。再計算はこの質を使用して，ジオイドモデルから求められた標高の質(GPSポイントの)，または高度の質(一般測量機ポイントの)を決定します。プロジェクトの座標系にジオイドモデルが設定されていない場合，このフィールドは使用できません。


プロジェクトプロパティダイアログ－特徴タブ

このタブを使用して，プロジェクトの特徴と属性を指定します。

これを呼び出すには､

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	特徴タブを選択します。

インポート時の特徴コード

インポート時の特徴コードチェックボックスを選択して、装置ファイルがインポートされる時に自動的に特徴コード処理を行います。自動的に行われる特徴コード処理に使用したい特徴・属性ライブラリを選択します。

ノート：このオプションを選択した場合でも，平面図表示でツールメニューを使用してあとで特徴コード処理を行えます。また，どんな特徴・属性ライブラリでも選択して使用できます。(ここで選択されたライブラリを使用する必要はありません。)

ライブラリ

使用したい特徴・属性ライブラリの名前を入力するか，参照をクリックして場所を指定します。このフィールドは特徴コードチェックボックスを選択しない限り，使用できません。

属性使用

属性のプロジェクト/テンプレートを設定するには，属性使用チェックボックスを選択します。

このフィールドは属性定義に使用されるライブラリを参照するだけです。

ライブラリ

ライブラリを選択するには，ライブラリフィールドにパスと名前を入力するか参照をクリックします。

参照

参照をクリックして必要なデータ辞書(*.ddf)ファイル，または特徴・属性ライブラリ(*.fcl)ファイルの場所を指定します。標準フォルダはTrimble Geomatics Office のシステムフォルダです。

特徴のあるポイントがデータベースにない場合，プロジェクトに割り当てられるこの特徴・属性ライブラリを変更できます。

しかし，いったん属性のあるSurvey Controller (*.dc)ファイルをインポートしたら，またはプロパティウィンドウを使用して属性を追加したら，属性に関するプロジェクト設定に使用される特徴・属性ライブラリを変更できません。これにより，プロジェクトに属性データがあるか確認できます。


Trimble Geomatics Office ファイル－概要

コンピュータにインストールされているTrimble Geomatics Office には，システムや各プロジェクトに関するいろいろな設定を保存するファイルがいくつかあります。

警告：これらのファイルは必要がない限り編集しないでください。エラーを招き，Trimble Geomatics Office が思ったように動作しないかも知れません。これらのファイルを編集したい場合は，はじめにファイルをバックアップしてください。

これらのファイルは下のセクションに分けられます。

Trimble ファイル

これらはProgram Files\Common Files\Trimble フォルダにあります。

Current.csd

Antenna.ini

Receiver.ini

Trimble Geomatics Office システムファイル

これらはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。

Asciiexp.dat

Asciiimp.dat ファイル

Asciirpt.dat

Html ファイル

Symbols.sym

Linetype.ltp

Default.fcl

Frm ファイル

プロジェクトファイル

これらは各プロジェクトのルートディレクトリ(通常，C:\Trimble Geomatics Office\Projects\<プロジェクト名>)にあります。

Options.ini

TGO_v150.mdb

TGO_v150.dbs


Options.ini ファイル

関連項目

Options.ini ファイルは各プロジェクトに割り当てられています。このファイルはプロパティウィンドウ，ポイント概要，レポートヘッダーに表示されるデータ全般をコントロールします。

Options.ini ファイルは3つのセクションに分けられます。

[Summary]（要旨）

[Report]（レポート）

[Labels]（ラベル）

要旨定義の構成

Options.ini ファイルの要旨定義により，ポイントの上にマウスポインタを置いた時に表示されるツールヒントと同様，ポイントが選択された時にステータスバーに表示されるポイントの詳細を指定します。標準では，[名前]:[特徴コード]に設定されているので，ポイント概要には名前と特徴コードの両方が表示されます。

ポイント概要に'/'で区切った名前とポイントスタイルを参照したい場合，Option.ini  ファイルの[Summary]セクションで下のように定義します。

Point=[名前]/[ポイントスタイル]

また，ライン，円弧，曲線，テキストエンティティに専用の概要を割り当てることもできます。例えば，ラインの概要として方位角と距離をレポートしたい場合，下の定義を[Summary]セクションに追加します。

Line=方位:[方位角]距離:[距離]

概要定義にフィールドコードと共にテキストを挿入できます。

標準では，ライン，円弧，曲線の概要は始点と終点のポイントの概要をカンマで区切ったものです。

レポートヘッダー の構成

[Report]セクションにより，[$レポート.ヘッダー]というフィールドコードを使用して，作成されるすべてのレポートに挿入される，標準のレポートヘッダーを定義できます。レポートヘッダーはテキストとフィールドコードの両方で構成できます。'\n'  を使用して新しい行をはじめることを指示できます。これにより，ヘッダーを数行に分けられます。例えば，会社名を標準のレポートヘッダーに挿入することができます。

ラベル オプションの構成

[Labels]セクションにより，ラベルダイアログに表示される新しいラベルオプションを追加できます。

フィールドコードとテキストの両方を使用してラベル定義を定義できます。'|'文字を使用して，各ラベルオプションを分割し，ラベルオプションの名前と実際にラベルとして表示されるテキストを分割します。例えば，ラベルオプションのすぐ後ろに，キーボードから下の文字列を入力します。

|説明|[説明]

これはラベルダイアログに新しいラベルオプション�説明�を追加します。選択されると，ラベルをつけられた各ポイントは説明フィールドの値が表示されます。

ノート：ライン，曲線，円弧のラベルオプションは定義できません。


TGO_v160.mdb ファイル

関連項目

警告：Trimble Navigation Limited はTrimble が開発したTrimble Geomatics Office を使用して行ったこのデータベースの使用・変更のみをサポートします。Trimble は他のソフトウェアアプリケーションを使用して行ったこのデータベースの使用・変更についてはサポートも認可もしません。また，そのパフォーマンスについて保証しません。Trimble はこの他のソフトウェアアプリケーションと互換性を持たないようにこのデータベースを修正することがあります。

各プロジェクトにはTGO_v160.mdb という名前のMicrosoft Access Database (*.mdb)ファイルがあります。これはプロジェクトフォルダにあります。このファイルは，テーブルおよびクエリーを含む，プロジェクトデータのすべてを含みます。Microsoft Access (Access 2000 以上)をお持ちの場合，次のことができます。

プロジェクトのデータを表示する

独自のクエリーを作成する


TGO_v160.dbs ファイル

新しいTrimble Geomatics Office プロジェクトをはじめて閉じた時，データベーススキーマ(*.dbs)ファイルが作成されます。これはMicrosoft Access Database (*.mdb)ファイルを基本にします。

.dbs ファイルも.mdb ファイルもプロジェクトのルートフォルダにあります。

データベースにカスタムクエリーを追加した場合，クエリーを作成後，この.dbsファイルを削除してください。

次にプロジェクトを開いた時に新しい.dbs ファイル(新しいクエリーを含む)が作成され，クエリーが使用可能になります。


Antenna.ini ファイル

このファイルにはTrimble Geomatics Office で使用できるGPS アンテナのリストあります。このソフトウェアにだけでなく、Trimble の他のソフトウェアにも使用されます。


Receiver.ini ファイル

このファイルには使用できる受信機のリストがあります。このファイルを編集しないでください。


Asciiexp.dat ファイル

このファイルはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。

これにはTrimble Geomatics Office のすべてのASCII およびカスタムエクスポートフォーマットが含まれます。このファイルはエクスポートダイアログを呼び出すごとに読み込まれます。

このダイアログを呼び出すには，下の1つを行ってください：

エクスポートツール [image] を選択する。

ファイル/エクスポートを選択する。

下の記号は，どのタブにフォーマットが表示されるかを表わします。ASCII 定義のみがこのファイルに含まれます。

記号	タブ
=	測量
+	CAD/ASCII
*	GIS
なし	カスタム

カスタムタブに表示されるフォーマットだけが編集できます。しかし，CAD/ASCII タブに表示されるフォーマットを編集したい場合は，フォーマット定義のはじめのプラス記号(+)を外してください。

例えば，Asciiexp.dat ファイルに下の行があります。

+SDRmap 座標

このフォーマットを編集できるようにするには，プラス記号(+)を外します。

次にエクスポートダイアログを呼び出した時，フォーマットはカスタムタブに表示され，編集ボタンが使用できます。

同様に，フォーマット名のはじめに上の記号の1つを挿入してカスタムフォーマットを編集できないフォーマットにすることができます。

例えば，下の行がAsciiexp.dat ファイルにあります。

カンマ区切りポイント

この行を下のように変更します。

+カンマ区切りポイント

次にエクスポートダイアログを呼び出した時，フォーマットがCAD/ASCII  タブに表示され，編集ボタンは使用できなくなります。


Asciiimp.dat ファイル

このファイルはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。このファイルにはTrimble Geomatics Office のすべてのASCII およびカスタムインポートフォーマットが含まれています。このファイルはインポートダイアログを呼び出すたびに読み込まれます。

このダイアログを呼び出すには，下の1つを行います。

インポートツール [image] を選択します。

ファイル/インポートを選択します。

下の記号はどのタブにフォーマットが表示されるかを表わします。ASCII 定義のみがこのファイルに含まれます。

記号	タブ
=	測量
+	CAD/ASCII
なし	カスタム

カスタムタブに表示されるインポートフォーマットだけが編集できます。しかし，CAD/ASCII タブに表示されるフォーマットを編集したい場合は，フォーマット定義のはじめのプラス記号(+)を外してください。

例えば，Asciiimp.dat ファイルに下の行があります。

+WILDsoft フォーマット

このフォーマットを編集できるようにするには，プラス記号(+)を外します。

次にインポートダイアログを呼び出した時，フォーマットはカスタムタブに表示され，編集ボタンが使用できます。同様に，フォーマット名のはじめに上の記号の1つを挿入して，カスタムフォーマットを編集できないフォーマットにすることができます。

例えば，下の行がAsciiimp.dat ファイルにあります。

カンマ区切りポイント

この行を下のように変更します。

+カンマ区切りポイント

次にインポートダイアログを呼び出した時，フォーマットがCAD/ASCII  タブに表示され，編集ボタンは使用できなくなります。


Asciirpt.dat ファイル

このファイルはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。このファイルにはTrimble Geomatics Office のすべてのデータベースレポートフォーマットが含まれています。このファイルは追加レポートダイアログを呼び出すたびに読み込まれます。

追加レポートダイアログを呼び出すには，レポート/追加レポートを選択します。

どんなシステムデータベースフォーマットでも，ファイルのフォーマット名から等号(=)を外すことにより，追加レポートダイアログから編集できるフォーマットにできます。

例えば，Asciirpt.dat ファイルに下の行があります。

=ポイント

このフォーマットを編集できるようにするには，等号(=)を外します。

これでフォーマットは編集できる追加レポートダイアログに表示されます。同様に，フォーマット名のはじめに等号を挿入して，カスタムフォーマットを追加レポートフォーマットから編集できないフォーマットにすることができます。

例えば，Asciirpt.dat ファイルに下の行があります。

固定長ポイント座標リスト

この行を下のように変更します。

=固定長ポイント座標リスト

これでフォーマットは追加レポートダイアログに表示され，編集できません。


.html ファイル

たくさんのテンプレートHypertext Markup Language (.html)ファイルがProgram Files\Trimble\Trimble Geomatics Office\System フォルダにインストールされています。これらのテンプレートは，システムレポートを作成するために使用されます。これらのファイルを削除しないでください。

Trimble Geomatics Office で作成されるレポート(例えば，Recompute.html)はプロジェクトのReports  の適切なフォルダに保存されます。.html レポートを開くには，Microsoft Windows のエクスプローラでレポートをダブルクリックします。標準のHTML ビューアでオープンされます。

ノート：これらの.html ファイルを編集して，システムレポートに出力される情報をカスタマイズすることができます。しかし，Trimble は編集された.html ファイルが思うように操作されなくてもサポートしません。Trimble は変更する前に.html ファイルのバックアップをすることをお勧めします。


Symbols.sym ファイル

Symbols.sym ファイルはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。

Trimble 記号エディタユーティリティを使用して，このファイルを表示したり編集したりできます。ファイルには記号が含まれます。Trimble Geomatics Office ，またはTrimble 特徴・属性エディタユーティリティでこのファイルから使用できる記号を使用して新しいポイントスタイルを作成できます。

また，独自の.sym ファイルを作成することもできます。詳しい.sym ファイルの使用方法にについてはTrimble Geomatics Office ソフトウェアユーザーガイドのユーティリティの章を参照してください。


Linetype.ltp ファイル

Linetype.ltp ファイルはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。Trimble ラインタイプエディタユーティリティを使用して，このファイルを表示したり編集したりできます。

ファイルにはラインタイプがあります。Trimble Geomatics Office ，またはTrimble 特徴・属性エディタユーティリティでこのファイルから使用できるラインタイプを使用して新しいラインタイプを作成できます。

また，独自の.ltp ファイルを作成することもできます。詳しい.ltp ファイルの使用方法についてはTrimble Geomatics Office ソフトウェアユーザーガイドのユーティリティの章を参照してください。


Default.fcl ファイル

Default.fcl ファイルはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。このファイルを表示したり編集したりするには，Trimble 特徴・属性エディタユーティリティを使用します。すべての.fcl ファイルは特徴・属性ライブラリです。

このファイルには，あらかじめ定義された特徴コード(属性があるものもないものもあります)，ポイントスタイル，ラインスタイル，注釈スタイル，コントロールコードがあります。

このファイルを使用するには､

1.	Trimble Survey Controller ソフトウェアに転送して特徴コード情報を収集する。

2.	Trimble Geomatics Office でこのファイルを使用して特徴コードを処理し，属性情報を収集する場合はプロジェクトの属性を設定します。

Trimble 特徴・属性エディタユーティリティを使用して独自の特徴・属性ライブラリを作成することができます。特徴・属性ライブラリの作成に関する情報は，Trimble 特徴・属性エディタのヘルプをご覧ください。


Current.csd ファイル

Current.csd ファイルはProgram Files\Common Files\Trimble\Geodata フォルダにあります。

Current.csd はTrimble Geomatics Office の座標系データベースです。このファイルはプロジェクトの座標系を選択する時に使用されます。

このファイルを表示したり編集したりするには，Trimble 座標系マネージャユーティリティを使用します。座標系の作成に関する情報は，Trimble 座標系マネージャのヘルプをご覧ください。


.frm ファイル

平面図フォームは.frm ファイルとして保存されます。それらはProgram Files\Trimble\Trimble Geomatics Office\System フォルダにあります。

印刷，またはプロットのページ設定を設定する場合，使用する平面図フォームを必ず選択してください。

ノート：.frm ファイルはテキストファイルです。表示したり編集したりするには，テキストエディタを使用します。


Microsoft Access 2000

警告：Trimble Navigation Limited はTrimble が開発したTrimble Geomatics Office を使用して行ったこのデータベースの使用・変更のみをサポートします。Trimble は他のソフトウェアアプリケーションを使用して行ったこのデータベースの使用・変更についてはサポートも認可もしません。また，そのパフォーマンスについて保証しません。Trimble はこの他のソフトウェアアプリケーションと互換性を持たないようにこのデータベースを修正することがあります。

Trimble Geomatics Office はMicrosoft Access 2000 データベースを使用します。古いバージョンのMicrosoft Access ソフトウェアをお持ちの場合，<project>.mdb ファイルを開くことはできません。Microsoft Access 2000 (または，それ以降)をお持ちの場合，このソフトウェアを使用してプロジェクトデータベースを表示し，新しいクエリーを作成することができます。


データベースクエリー－概要

詳細情報

利用方法

警告：Trimble Navigation Limited はTrimble が開発したTrimble Geomatics Office を使用して行ったこのデータベースの使用・変更のみをサポートします。Trimble は他のソフトウェアアプリケーションを使用して行ったこのデータベースの使用・変更についてはサポートも認可もしません。また，そのパフォーマンスについて保証しません。Trimble はこの他のソフトウェアアプリケーションと互換性を持たないようにこのデータベースを修正することがあります。

概要

Trimble Geomatics Office はMicrosoft Access 2000 データベースを使用します。Microsoft Access を使用して，独自のクエリーを作成することができます。

ノート：Trimble はいかなるユーザ定義クエリーもサポートしません。

ここで説明する詳細はTrimble Geomatics Office で使用するクエリーの設計に関する情報に限られます。これらの技術を確認する必要がある場合は，Microsoft Access のマニュアルをご参照ください。

Microsoft Access クエリーの定義

通常，プロジェクトで使用するために定義したいクエリーは，プロジェクトテンプレートに定義されます。

クエリー定義を他のMicrosoft Access データベースへエクスポートすることができます。従って，あるプロジェクトで便利なクエリー定義を作成できた場合，Trimble Geomatics Office のほかのプロジェクトで使用できるようにするため，あとでこれらの定義をメインのプロジェクトテンプレートにエクスポートすることができます。

Trimble Geomatics Office でMicrosoft Access クエリーを使用するポイントは，クエリーで指定されたID フィールドがクエリーで選択されたエンティティタイプを定義することです。

選択クエリーにはID フィールドの使用に関係する2つの条件があります。

クエリーはID フィールドである最初の出力カラム(カラムの表示チェックボックスを選択します)，またはテーブル全体(*オプション使用)で定義されている必要があります。

クエリーが複数のエンティティを選択するよう設計されている場合(例えば，円弧エンティティに関連するすべてのポイントを選択する)，選択される各エンティティに関係するID フィールドだけがクエリーの出力フィールドです。

Trimble Geomatics Office のクエリー定義

Trimble Geomatics Office で使用されるクエリーを定義したい場合，必要なリストにクエリーが表示されるためにクエリー名の頭に正しい頭文字をつけてください。

ノート：レポートおよびエクスポートクエリーで，必ず選択セットデータテーブルがクエリー名で参照されます。例えば，ポイントリストをエクスポートするには，クエリーはExport(Point)_Point List とコールされます。

選択する目的でクエリーを作成し，選択/クエリーリストに表示したい場合，クエリーの頭にはSelect_  が必要です。Select_  が頭につくクエリーはすべて，カスタムレポート作成時に使用できます。

レポートだけのクエリーを設計したい場合，Report(Selection Set data table)_ を頭につけてください。Report(Selection Set data table)_ が頭につくクエリーは選択/クエリーリストには表示されません。

プロパティウィンドウの選択リストにフィルターで項目を外すクエリーを追加したい場合，SS_ を頭につけてください。プロパティウィンドウでフィルターツールをクリックするとクエリーがリストに表示されます。


Microsoft Access のクエリーにパラメータを渡す

警告：Trimble Navigation Limited はTrimble が開発したTrimble Geomatics Office を使用して行ったこのデータベースの使用・変更のみをサポートします。Trimble は他のソフトウェアアプリケーションを使用して行ったこのデータベースの使用・変更についてはサポートも認可もしません。また，そのパフォーマンスについて保証しません。Trimble はこの他のソフトウェアアプリケーションと互換性を持たないようにこのデータベースを修正することがあります。

同じカスタムクエリーを異なるエンティティの異なる項目で使用できるようにするには，Microsoft Access ソフトウェアでクエリー定義の一部としてパラメータを指定します。

パラメータが指定されると，クエリーが開始された時にTrimble Geomatics Office により，適切な値を入力できます。クエリーにあるパラメータ使用の用例は，特徴コードで選択しているポイントエンティティのクエリーを用意します。

例えば，ある時点で特徴コード�樹木�を持つポイントをすべて選択し，あとで特徴コード�ポスト�を持つポイントをすべて選択することができます。

抽出条件フィールドに，抽出したい比較条件(つまり=，>，<，Like )と共に表示したいプロンプトを角括弧([])で入力すると，パラメータがクエリー定義のカラムに指定されます。

例えば，ポイントをその特徴コードにより選択するクエリーの場合，特徴コードフィールドがクエリー定義に追加される必要があります。抽出条件フィールドは，抽出条件を定義する必要があります。例えば：猫ike [コード]�。

この用例では，Like 比較演算子が使用され該当するコードをチェックします。

クエリーパラメータの指定で絞り込みができます。これにより，グラフィックモデルでエンティティをクリックしてTrimble Geomatics Office のパラメータを埋めることができます。この絞り込みは，下のようなコロンのあるパラメータプロンプトで定義され，データベースフィールドの名前が埋められます。上記のコードの用例は次のようになります。
Like [コード:特徴コード]

抽出条件フィールドのパラメータ条件の定義について付け加えると，クエリーのダイアログにパラメータ定義を入力する必要があります。ポインターがクエリーダイアログの上の部分にあるとき，ショートカットメニューからダイアログが表示されます。

ノート：パラメータフィールドには，必ず抽出条件フィールドの角括弧に入力されたテキストと同じテキストが含まれている必要があります。

各パラメータのデータタイプフィールドは，入力されているデータのタイプに従って設定されます。上の用例では，特徴コードがテキストタイプのフィールドなので，これはテキストに設定されます。ポイントの高度のような実数タイプのパラメータが指定されている場合，データタイプフィールドはDouble  に設定されます。

ここで説明する詳細はTrimble Geomatics Office で使用するクエリーの設計に関する情報に限られます。これらの技術を確認する必要がある場合は，Microsoft Access のマニュアルをご参照ください。


カスタムクエリーを使用して選択セットを抽出する

警告：Trimble Navigation Limited はTrimble が開発したTrimble Geomatics Office を使用して行ったこのデータベースの使用・変更のみをサポートします。Trimble は他のソフトウェアアプリケーションを使用して行ったこのデータベースの使用・変更についてはサポートも認可もしません。また，そのパフォーマンスについて保証しません。Trimble はこの他のソフトウェアアプリケーションと互換性を持たないようにこのデータベースを修正することがあります。

Microsoft Accessを使用して，選択セットデータテーブルに作用するより，複雑なクエリーを作成することも可能です。これにより，選択クエリーは効果的にデータベースの選択セットを抽出できます。

選択セットデータテーブルには，すべての選択セットにあるすべてのエンティティのレコードID が含まれています。

この抽出関数を作成するには，選択されるエンティティを含んでいるテーブル(例えば，ポイントテーブル)と共に，選択セットデータテーブルがクエリー定義に含まれている必要があります。この場合，選択セットデータテーブルのレコードID  フィールドは，クエリーに含まれる他のテーブルの適切なID フィールドに結合されている必要があります。2つのテーブルのフィールドのこの結合は，1つのテーブルの適切なフィールド名を他のテーブルのフィールド名にドラッグ・アンド・ドロップすることにより作成されます。

上で述べたほかの選択クエリー同様，クエリーで表わされる最初のフィールドはID フィールドかテーブル全体でなければなりません。特定のテーブルからの選択エンティティにのみ適用されるクエリーについては，クエリーは選択セットデータテーブルから選択されているエンティティを含むテーブル名を定義しなければなりません。これは，ポイントが選択されている場合，選択セットデータテーブルからのテーブル名フィールドがクエリーに追加される必要があることを意味します。抽出条件は'Point'に設定します。

選択セットデータテーブルには，すべての選択セットにあるすべてのエンティティのレコードID が含まれます。各選択セットは選択セットデータテーブルの選択セット名のID カラムにリストされているユニークなID 番号に割り当てられています。番号0 は，エンティティが現在の選択セットのメンバーであることを示します。従って，クエリーはこの値を使用して現在の選択セットだけが抽出されることを確認できます。これは，選択セット名ID を定義するクエリーにカラムを追加し，抽出条件を0に設定することにより行われます。この抽出条件を他の値に設定することにより，必要な既存の選択セットをベースにした現在の選択を作成します。

ここで説明する詳細はTrimble Geomatics Office で使用するクエリーの設計に関する情報に限られます。これらの技術を確認する必要がある場合は，Microsoft Access のマニュアルをご参照ください。


プロジェクトテンプレート－概要

詳細情報

利用方法	ダイアログ
概要

新しいプロジェクトを作成するとき，テンプレートを選択してください。テンプレートにはすべての設定，データ，ファイル構造が含まれています。テンプレートの情報はプロジェクトを作成する時，プロジェクトにコピーされます。例えば，テンプレートのCheckin  フォルダにSurvey Controller (*.dc)ファイルがあったとすると，プロジェクトは同じ.dc ファイルをそのCheckin  フォルダに持ちます。プロジェクトに行われた編集は，テンプレートには行われません。

テンプレートは次の場合に便利です。

使用したいCAD スタイルを選択する

データベースに基準点を追加する

必要なファイルを追加する

適切な座標系を選択する

必要な単位を選択する

重複ポイント設定を選択する

Trimble はTrimble Geomatics Office と共に各種のテンプレートを提供します。例えば，メートルテンプレートにより，そのテンプレートを使用して作成されたプロジェクト全般でメートル観測を使用できるようにします。

テンプレートはProgram Files\Trimble\Trimble Geomatics Office\Template フォルダに保存されています。


再計算レポートコマンド

このコマンドを使用して，再計算レポートを表示します。レポートは測量データの最後の再計算から作成されます。

このレポートを呼び出すには，レポート/再計算レポートを選択します。

レポートは標準のHTML ビューアに表示されます。


システムレポート－概要

関連項目

システムレポートは測量データの処理操作や計算に伴って生成されます。これらのレポートはReports フォルダに作成されます。インポートレポートは例外にして，新しいレポートが生成されるとき，フォルダにある同じ名前のすべての既存レポートを上書きします。

下のレポートは処理操作の後、システムによって自動的に作成されます｡

インポートレポート

再計算レポート

特徴コード処理レポート

プロジェクト貼り付けレポート

これらのレポートについて通知を受けるには，プロジェクトプロパティダイアログ－レポートタブの作成したレポート表示オプションを選択します。

測量操作を行ったあと，次のシステムレポートを生成します。これらのレポートは測量計算，または測量データへの変更に関する詳細があります。

再計算

ポイント関連レポート

GPS 基線解析レポート(WAVE 基線解析モジュールをインストールしている場合)

GPS 環閉合レポート

網平均レポート(網平均モジュールをインストールしている場合)

GPS サイトキャリブレーションレポート

座標変換レポート

標高調整レポート

逆算レポート

ポイント名変更レポート

レベル観測レポート

ノート：いくつかのレポートが使用可能かどうかは，インストールされているモジュール(基線解析と網平均)に依存します。


データベースレポート－概要

関連項目

データベースレポートは，データベースの主なテーブルレコードとクエリーから生成するレポートです。つまり，プロジェクトデータベースからの情報をレポートします。

これらのレポートは，プロジェクトの概要が欲しい場合や顧客へのレポートを作成したい場合に便利です。

データベースレポートは2つのカテゴリに分かれます｡

システムデータベースレポート

カスタムレポート

これら2つのレポートは追加レポートダイアログから呼び出されます。

Trimble Geomatics Office で作成される既存のデータベースレポートを使用したり修正したり，または独自のレポートフォーマットにカスタマイズできます。


レポート－概要

Trimble Geomatics Office はすべてのレポートをHTML（HyperText Markup Language)フォーマットで作成し，コンピュータにインストールされているHTML ビューアに表示します。通常，標準のHTML ビューアはWeb ブラウザになります。

すべてのレポートはTrimble Geomatics Office \Project   ディレクトリのReports  フォルダに作成されます。レポートはレポートタイプの名前のフォルダに作成されます。インポートレポートと網平均レポートは例外にして，新しいレポートが生成されるとき，フォルダにある同じ名前のすべての既存のレポートを上書きします。

2つのタイプのレポートが生成できます｡

システムレポート

データベースレポート

通常，使用されたレポートはレポートメニューから呼び出せます。いくつかのレポートが使用可能かどうかは，インストールされているモジュール(基線解析と網平均)と，レポートが既に生成されたかどうかに依存します。

ノート：Trimble Geomatics Office レポートはMicrosoft インターネットエクスプローラバージョン2 または3 では表示されません。このバージョンをお持ちの場合，Trimble はWeb からMicrosoft インターネットエクスプローラ4 または5 をインストールすることをお勧めします。


Microsoft インターネットエクスプローラWeb ブラウザ－レポートビューア

HTML ビューアをインストールしていない場合，Microsoft インターネットエクスプローラWeb ブラウザがWebから入手できます。Microsoft インターネットエクスプローラWeb ブラウザで作成したレポートを表示，印刷します。Microsoft インターネットエクスプローラの便利な機能を使用してレポートの目的に対応できます。

レポートの表示をカスタマイズする

Trimble Geomatics Office のレポートは標準化されたフォーマットで表示されます。フォント，フォントサイズ，色，背景はすべてのレポートを通して同じです。好みでこれらの設定を変更することができます。読みやすいフォーマットのレポートを表示したい場合はこれを行ってください。

ヒント：レポートの背景を変更するには，Reports  フォルダのbackgrnd.gif  ファイルを，同じ名前の他のCompuServe Graphics Interchange (GIF)グラフィックファイルで置き換えます。

印刷オプションを設定して，レポートの背景を印刷されないようにできます。標準では，このオプションはオフになっています。

他のソフトウェアアプリケーションで開く

多くのソフトウェアアプリケーションがHTML フォーマットのドキュメントをサポートしています。加えて，テキストエディタ，表計算シート，ワープロのようなほかのアプリケーションで開くため，レポートをテキスト(*.txt )ファイルで保存することもできます。レポートの選択部分をクリップボードにコピーし，他のソフトウェアアプリケーションに貼り付けることもできます。

これらの特徴は，ドキュメントにレポートを挿入したり，レポートの内容を編集したり，データを使用して他のアプリケーションでさらに計算したい場合，便利です。

Microsoft インターネットエクスプローラの使用についての詳細は，インターネットエクスプローラのヘルプをご覧ください。


レポートフォーマット定義ダイアログ

このダイアログを使用してレポートフォーマットを定義します。

このダイアログを呼び出すには､

1.	レポート/追加レポートを選択します。追加レポートダイアログが表示されます。

2.	下の1つを行います｡

新規をクリックして新しいレポートフォーマットを定義します。

既存フォーマットをレポートリストから選択し，編集をクリックして選択されたフォーマットを編集します。

ノート：ポイント，標高範囲，座標系詳細，ポイント比較レポートは編集できません。

名前

レポートフォーマットの名前を入力します。この名前はカスタムレポートダイアログのレポートリストに表示されます。すでにある名前は入力できません。

空白文字列

空白文字列はファイル/プロジェクトプロパティ/単位とフォーマットタブで設定されているヌル表示を表示します。このフィールドで指定される文字列は，生成されるカスタムレポートの値がヌルのフィールドに使用されます。このフィールドはオプションです。

説明

レポートフォーマットの説明を説明フィールドに入力します。この説明はステータスバーに表示されます。このフィールドはオプションです。

標準拡張子

標準拡張子はレポートフォーマットの定義に使用されます。

レポート対象

レポートのソースとして主なテーブル，またはクエリーの1つを選択します。標準のソースはポイント情報レコードです。これによりポイントテーブルのすべてのレコードをレポートできます。

フォーマットを自動的に設定

フォーマットを自動的に設定をクリックして，ヘッダーと本分を自動的に初期化します。詳しくはフォーマットを自動的に設定をご覧ください。

ヘッダーフォーマット

レポートのヘッダーを作成する固定のテキスト，フィールドコード定義(ショートカットメニューから選択可能)を入力します。このフィールドはオプションで，定義を指定しなくてもかまいません。

空行をヘッダー定義に追加するにはEnterを押します。

本文フォーマット

適切なフィールドコード定義(ショートカットメニューから選択可能)を入力し，Trimble Geomatics Office はプロジェクトからどのデータをレポートするのか指示します。

例えば，固定長のポイントリストを作成する場合，下のフォーマットを使用します｡

[名前:10][最初の縦列:14.3][2番目の縦列:14.3][標高:14.3][特徴コード:20]

ヘッダーフォーマット，あるいは本文フォーマット(ただし，両方でなく)は空白のままにしておくことができます。

フッターフォーマット

レポートのフッターを作成する固定のテキスト，フィールドコード定義(ショートカットメニューから選択可能)を入力します。このフィールドはオプションで，定義を指定しなくてもかまいません。例えば，このフッターを使用してEOF(ファイル終了コマンド)を表示します。

空行をフッター定義に追加するにはEnterを押します。

システムで使用できるフィールドコードの詳細はフィールドコード�概要をご覧ください。


再計算レポート－概要

再計算レポートはHyperText Markup Language (HTML)のレポートで，再計算処理の結果を要約します。再計算レポートを使用して，警告フラグを除去するため次を行います｡

観測の詳細をチェックする

ポイントに正しく名前が付けられているかチェックする

誤ってキー入力された座標と考えられる場合，座標を無効にする

必要であれば再観測する

再計算レポートは下の内容をレポートします｡

複数の観測，または座標から許容値を超える結果が得られた許容誤差。(許容値はプロジェクトプロパティダイアログの再計算タブに定義されています。)

2つ以上の観測，またはキー入力座標がポイントの計算された位置の決定に使用され，その位置が許容値内である閉合。

使用されていない観測と誤差。

開始座標と座標が求められた順序。

レポートで参照された観測と座標。

Trimble Geomatics Office は再計算レポートを再計算ごとに作成します。再計算レポートが作成されたことをどのように知るかは，プロジェクトプロパティダイアログのレポートタブの作成したレポート表示フィールドに依存します。再計算レポートは常にプロジェクトのReports  フォルダに保存されます。このようなすべてのシステムレポートは，既にレポートがある場合，古いものを新しいもので上書きします。

再計算レポートには次のパートがあります｡

プロジェクト詳細

エラー

警告

閉合

ポイント関連

開始点

トラバースレポート

測量データ(観測と座標)


再計算レポート－プロジェクト詳細セクション

再計算レポートのプロジェクト詳細セクションは，プロジェクト名と座標系の詳細を要約します。


再計算レポート－エラーセクションと警告セクション

再計算レポートのエラーセクションと警告セクションは，ポイントの座標が2つ以上求められ，座標が許容値を超えるすべてのポイントのリストをレポートします。また，どの観測が使用されていないか，どのポイントの座標が決定されなかったか表示します。

これらのセクションを使用して，エラーと警告を検査し，それらを解決するためにプロジェクトを編集すべきか決定します。あるポイントのポイント関連を見るには，そのポイントをクリックします。これによりポイント関連セクションに移動します。

水平許容値，および垂直許容値も表示されます。これらはプロジェクトプロパティダイアログ�再計算タブに接点されています。


再計算レポート－ポイント関連セクション

再計算レポートのポイント関連セクションは，ポイントに計算された位置を表示します。再計算レポートに含まれている誤差や閉合のあるポイントだけが，ポイント関連セクションにレポートされます。計算された位置の水平成分(北距，東距)の質，標高成分，高度成分が表示されます。

下の計算された位置と質は，ポイントの座標を決定するために使用された測量データのリストです。

各観測の表示：

観測タイプ

観測ID

'始点'と'終点'

観測の詳細を表示するには，ID をクリックします。これにより再計算レポートの測量データセクションに移動します。

グラフィックウィンドウ(およびプロパティウィンドウ)で観測を選択するには，観測ID の左のアイコンを選択します。これにより，測量画面の許容値を超える閉合のある観測を簡単に表示できます。

各座標の表示：

座標のタイプ(グリッド，測地，位置の解)

座標のソース

座標ID

座標の詳細を表示するには，ID をクリックします。これにより，再計算レポートの測量データセクションに移動します。

また，グラフィックウィンドウ，およびプロパティウィドウのポイントを選択するには，観測ID の左のアイコンを選択します。

計算に使用カラムはどの位置成分(NE，e，h )が観測または座標から計算に使用されたかを表示します。例えば，観測がポイントの北距，東距，高度成分を決定し，座標が標高を決定する場合，計算に使用カラムはGPS 観測の隣りにNEh，座標の隣りにe を表示します。

デルタ北距，デルタ東距，デルタ標高，デルタ楕円体高カラムは，最終の計算された位置と観測，または座標だけを使用して計算された位置の差を表示します。

デルタの値が上のプロジェクトに設定されている許容値を超える場合，フラグが表示され，数値が赤くなります。赤にマークされた観測は，必ずしも誤った観測やキー入力座標を示すわけではなく�再計算が質の悪い観測やキー入力座標を使用した可能性を示します。誤差の原因を判断し，質の悪い観測を無効にしてください。

レポートの測量セクションを使用して，各観測を検査します。

ヒント：プロパティウィンドウとレポート/ポイント関連レポートコマンドを使用して，プロジェクトのすべてのポイントの，再計算レポートにレポートされなかったポイントも，関連レポートを表示できます。


再計算レポート－トラバースレポートセクション

再計算レポートのトラバースレポートセクションは，トラバースが始点からどうのように計算されたか，使用した観測について表示します。

トラバースレポートは，始点から2辺以上ある場合のみレポートされます。これは，オフセットがレポートされることを避けるためです。

例えば，観測が次のような場合：

始点のポイント1 から�ポイント2 �ポイント3 そしてポイント1 へ戻る，これはレポートされます。

始点のポイント1 から�ポイント2，これはレポートされません。


再計算レポート－閉合セクション

再計算レポートの閉合セクションは，ポイントへの複数の観測があり，プロジェクトに指定された許容値内にあるステーションポイントのリストをレポートします。ポイントへのすべての測量データからの閉合はデルタ北距，デルタ東距，デルタ標高，デルタ楕円体高のカラムに表示されます。

ポイントをクリックしてポイント関連の詳細を表示します。これによりポイント関連セクションに移動します。


再計算レポート－測量データセクション

測量データセクションは，再計算レポートに表示されるポイントのすべての観測と座標を表示します。測量データは観測タイプごとに構成されます。どの観測が正しくないか判断するとき，このセクションを使用します。

再計算レポートで参照されている観測と座標だけがこのセクションにリストされます。

すべての測量データはプロパティウィンドウで表示できます。


再計算レポート－開始ポイントセクション

再計算レポートの開始ポイントセクションは，再計算がどの点から観測の計算をはじめたか表示します。


再計算レポート－追加座標系詳細

追加座標系詳細セクションは，ローカルサイト設定についての情報をリストします。

ローカルサイト設定はプロジェクトプロパティダイアログ�座標系タブに設定されています。


ポイント関連レポートコマンド

このコマンドを使用して，選択されたポイントのポイント関連レポートを表示します。

これを呼び出すには､

1.	表示したいポイントを選択します。

2.	レポート/ポイント関連レポートを選択します。

ポイント関連レポートが標準のHTML ビューアに表示されます。


ポイント関連レポート

ポイント関連レーポートはポイントの計算された位置を表示する再計算レポートの一部です。計算された位置の水平成分(北距，東距)の質，標高成分，高度成分を表示します。

レポートのフォーマットは再計算レポートのポイント関連セクションと同じです。

このレポートを呼び出すには､

1.	表示したいポイントを選択します。

2.	下の1つを行います｡

レポート/ポイント関連レポートを選択する。

プロパティウィンドウ/測量タブ/概要ページを開き，ポイント関連アイコン [image] を選択する。

レポートは標準のHTML ビューアに表示されます。

ノート：測量画面でポイントを選択するには，ID の左にあるポイント，または観測アイコンをクリックします。これは測量画面のポイントに移動するのに便利です。


逆算レポートコマンド

このコマンドを使用して，逆算ダイアログから逆算され，作成された1番新しい逆算レポートを表示します。

これを呼び出すには､

レポート/逆算レポートを選択します。

レポートは標準のHTML ビューアに表示されます。


逆算レポート

逆算レポートは逆算した後に作成され，逆算に関する概略，詳細，その組み合わせの情報を表示します。

概略逆算レポートは，逆算を定義するのに使用された�始点�と�終点�間のグリッド方位角，グリッド距離，デルタ標高を表示します。

詳細なレポートは�始点�と�終点�の位置をグリッド，ローカル(地理座標)，地心座標(WGS-84 )座標系で表示し，計算された逆算パラメータを表示します。

逆算ダイアログを使用してレポートを作成します。

レポートが作成されると，レポート/逆算レポートを選択していつでも1番新しいレポートを表示できます。


ポイント名変更レポート

ポイント名変更レポートは，ポイント名変更コマンドを使用して名前を変更されたポイントの元の名前と新しい名前を表示するために生成できるレポートです。

名前変更ダイアログを使用してレポートを生成します。


インポートレポート

ファイルをプロジェクトに転送すると必ず，Trimble Geomatics Office はインポートレポートをインポートされたファイルごとに作成します。これには<インポートされたファイル名>.html という名前が付けられます。レポートには下のセクションがあります｡

プロジェクト詳細

このセクションは，プロジェクト名と座標系の詳細を要約します。

メッセージ

このセクションはインポート時に作成されたメッセージをリストします。インポート時にメッセージがなかった場合，このセクションは表示されません。

再計算レポート

レポートには，インポート処理後に自動的に作成された再計算レポートへのリンクがあります。再計算レポートは再計算処理の結果を要約します。

特徴コード処理レポート

インポート時に特徴コードが処理された場合，レポートには，特徴コード処理レポートへのリンクがあります。

ノート：再計算レポートまたは特徴コード処理レポートへのリンクが赤の場合，これは処理中にエラーが発見されたこと，エラーがレポートに表示されていることを意味します。

インポート処理中，Import.html という名前のインポートされたファイルのレポートが同時に作成されます。このレポートはプロジェクトにインポートされたすべてのファイルをリストします。他のセッションで同じプロジェクトにインポートされたすべてのファイルは，自動的にこのレポートに追加されます。

このレポートについて通知する方法は，プロジェクトプロパティダイアログ�レポートタブの作成したレポート表示オプションで設定されます。


追加レポートコマンド

このコマンドを使用して，Trimble Geomatics Office に用意されているシステムデータベース，またはカスタムレポートを生成します。

これを呼び出すには，レポート/追加レポートを選択します。追加レポートダイアログが表示されます。


追加レポートダイアログ

追加レポートダイアログを使用して，Trimble Geomatics Office に用意されているシステムデータベース，またはカスタムレポートを生成します。このダイアログを呼び出すには，レポート/追加レポートを選択します。

システムデータベースレポート

システムデータベースレポートは，プロジェクトの概要を出力する，あらかじめ定義されているレポートフォーマットです。通常，レポートは編集できませんが，レポートフォーマットは編集できます。これを行うには，Program Files\Trimble\Trimble Geomatics Office\System フォルダのAsciirpt.datファイルを編集します。

カスタムレポート

カスタムレポートは，指定された内容に従って，データベースに定義されている主なレコードタイプ，またはクエリーを使用します。

カスタムレポートフォーマットを作成，定義，編集できます。しかしまた，Program Files\Trimble\Trimble Geomatics Office\System フォルダのAsciirpt.datを編集してこれらのレポートフォーマットが編集されるのを防ぐこともできます。

実行したいレポートの名前の後ろに省略のマーク(�)がある場合，はじめに何らかの情報を入力する必要があります。例えば，標高レポートを選択するとき，Trimble Geomatics Office は最小の標高と最大の標高の入力を求めます。

レポート対象

選択されたエンティティ，またはレコードタイプをレポートする2つのオプションがあります｡

選択	このオプションを選択して，選択されたエンティティ，またはレコードタイプについてレポートします。
データベース全体	このオプションを選択して，すべてのエンティティ，またはレコードタイプについてレポートします。
何も選択されていないとき，これらのボタンは使用できなくなり，すべてのエンティティとレコードタイプについてレポートされます。

ノート：座標系詳細レポートが選択されているとき，このオプションは使用できません。

データのソート

データをレポートする順序を選択できます。

これを行うには､

1.	データのソートチェックボックスを選択します。

2.	リストからソート順を選択します。選択できるソートは､

データベース順	標高
名前	質
開始時刻	データタイプ
観測時間の長さ
ノート：同じソートオプションがプロパティウィンドウで使用できます。

ヒント：独自のソートクエリーを作成する場合，それもこのリストに表示されます。

レポート

レポートグループはシステムデータベース，またはカスタムのレポートをリストします。たくさんのレポートがTrimble Geomatics Office で使用するよう，あらかじめ定義されています。

OK

レポートを作成し，標準のHTML ビューアに表示します。

新規

新しいレポートフォーマットを作成し定義します。

編集

既存のレポートフォーマットを修正します。

削除

レポートを削除します。削除の確認画面が表示されます。

ノート：入力した個々の値は，現在の表示単位でなく，データベースの座標単位で変換されます。データベースの単位は，最初のデータがデータベースに保存された時の表示単位を基本に設定されます。

ヒント：Program Files\Trimble\Trimble Geomatics Office\System フォルダのAsciirpt.dat ファイルをテキストエディタで編集して，これらのレポートを修正できます。


GPS サイトキャリブレーションレポートコマンド

このコマンドを使用して，GPS サイトキャリブレーションダイアログからキャリブレーション計算後に作成された1番新しいGPS サイトキャリブレーションレポートを表示します。

このレポートを呼び出すには，レポート/GPS サイトキャリブレーションレポートを選択します。

レポートは標準のHTML ビューアに表示されます。

ノート：このコマンドは測量画面では使用できません。

測量画面でGPS サイトキャリブレーションレポートを呼び出すには，GPS サイトキャリブレーションダイアログからレポートをクリックします。


GPS サイトキャリブレーションレポート

GPS サイトキャリブレーションレポートは，サイトキャリブレーションの計算後に生成されます。これは，計算されたポイントの位置とそれぞれの既知座標との比較とその各残差のリスト，および計算されたすべてのパラメータを表示します。

GPS サイトキャリブレーションダイアログを使用してレポートを生成します。


座標変換レポートコマンド

このコマンドを使用して，座標変換ダイアログから変換計算が行われたあとに生成された1番新しい座標変換レポートを表示します。

このレポートを呼び出すには，レポート/座標変換レポートを選択します。

レポートがMicrosoft インターネットエクスプローラWeb ブラウザに表示されます。

ノート：このメニューコマンドは測量画面にはありません。測量画面からレポートを生成するには，座標変換ダイアログから座標変換レポート作成チェックボックスを選択します。


座標変換 レポート

座標変換レポートは座標変換の計算後に生成され，元の座標と変換された座標を表示します。

座標変換ダイアログを使用してレポートを生成します。

レポートが作成されると，平面図画面のレポート/座標変換レポートを選択して1番新しいレポートをいつでも表示できます。


標高調整レポートコマンド

このコマンドを使用して，標高調整ダイアログから調整が行われたあとに生成された1番新しい標高調整レポートを表示します。

これを呼び出すには，レポート/標高調整レポートを選択します。

レポートが標準のHTML ビューアに表示されます。

ノート：このコマンドは標準では測量画面にはありません。測量画面からレポートを生成するには，標高調整ダイアログから標高調整レポート作成チェックボックスを選択します。


標高調整 レポート

標高調整レポートは標高調整が行われたあとに生成され，元の座標と調整された座標を表示します。

標高調整ダイアログを使用してレポートを生成します。

レポートが作成されると，平面図画面のレポート/標高調整レポートを選択して1番新しいレポートをいつでも表示できます。


特徴コード処理レポート

特徴コード処理レポートは特徴コード処理の操作によって生成されます。

プロジェクトプロパティダイアログ�レポートタブの作成したレポート表示オプションを設定して，このレポートが作成されたときに通知を受けます。

レポートは処理操作を要約し，使用された特徴・属性ライブラリ(.fcl )ファイルと特徴コード処理時に発見されたすべての問題の詳細情報を含みます。


プロジェクト貼り付けレポート

プロジェクト貼り付けレポートは，ポイントがコピーされプロジェクトに貼り付けられた後に生成されます。

プロジェクトプロパティダイアログ�レポートタブの作成したレポート表示オプションを設定して，このレポートが作成されたときに通知を受けます。

レポートは，属性定義がプロジェクト間で異なる場合，コピーされたポイントに割り当てられたすべての貼り付けられなかった特徴・属性を要約します。


レベルレポートコマンド

このコマンドを使用して，選択されたファイルのレベルレポートを表示します。

これを呼び出すには､

1.	レポート/レベルレポートを選択します。

2.	レベルファイルを選択します。

選択されたレベルファイルのレベルレポートが標準のHTML ビューアに表示されます。


レベルレポート

レベルレポートはレベルファイルのレベル観測とデータを表示します。

これを呼び出すには､

1.	レポート/レベルレポートを選択します。

2.	レベルファイルを選択します。

レポートは標準のHTML ビューアに表示されます。レポートは下の情報を表示します｡

レベルデータ

このセクションは水準路線をlevel fieldbook フォーマットで表示します。後視，主要点，前視の観測と，デジタルレベルインポートダイアログに表示された計算された標高の情報を表示します。

レベル観測

レベル観測テーブルは下の情報を表示します｡

ID

始点

終点

質

デルタ標高�この値はステーションポイント間の計算から求められます。

ヒント：グラフィックウィンドウのレベル観測を選択するには，観測ID を選択します。これにより，プロパティウィンドウのレベル観測を簡単に表示します。

ノート：レベルレポートは<プロジェクト名>\Reports\Level フォルダに保存されます。


｢すべて｣ ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､現在のﾌﾟﾛｼﾞｪｸﾄ内のすべてのｴﾝﾃｨﾃｨを選択します。

それを行うには､選択/すべてを選択します。

測量表示（Survey view）

測量表示で作業をしている場合には､表示されているｴﾝﾃｨﾃｨのすべてが選択されます。

例えば､いくつかの観測を隠すために表示/ﾌｨﾙﾀｰｺﾏﾝﾄﾞを使用してから選択/すべてｺﾏﾝﾄﾞを使用する場合には､隠された観測は選択されません。

計画表示（Plan view）

計画表示で作業をしている場合には､以下を持つﾚｲﾔｰ内のすべてのｴﾝﾃｨﾃｨが選択されます。

ｵﾝに設定された表示ﾌﾟﾛﾊﾟﾃｨ

ｵﾌに設定されたﾛｯｸﾌﾟﾛﾊﾟﾃｨ

例えば､ﾚｲﾔｰ選択ﾂｰﾙ [image] を使用して､
ﾚｲﾔｰのﾛｯｸﾌﾟﾛﾊﾟﾃｨをｵﾝにしてから選択/すべてｺﾏﾝﾄﾞを使用する場合には､ﾛｯｸされたﾚｲﾔｰ内のｴﾝﾃｨﾃｨは全く選択されません。

ﾋﾝﾄ:ｽﾃｰﾀｽﾊﾞｰは､選択されたｴﾝﾃｨﾃｨ数の要旨を示します。


｢なし｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､選択を取り消します。

それを行うには､選択/なしを選択します。

ﾋﾝﾄ:ｽﾃｰﾀｽﾊﾞｰは､選択が空であることを示すﾒｯｾｰｼﾞを表示します。


｢ﾎﾟｲﾝﾄ｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞを開きます。

それを行うには､選択/ﾎﾟｲﾝﾄを選択します。


｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞ

概要	使用方法

このﾀﾞｲｱﾛｸﾞを使用して､特定された規準を使用してﾎﾟｲﾝﾄを選択します。ﾜｲﾙﾄﾞｶｰﾄﾞと範囲を使用できます。複数のﾀﾌﾞに規準を入力することもできます。Trimble Geomatics Office はすべての規準を満たすﾎﾟｲﾝﾄだけを選択します。

それを行うには､選択/ﾎﾟｲﾝﾄを選択します。

測量表示を使用してこのﾀﾞｲｱﾛｸﾞにｱｸｾｽする場合には､Trimble Geomatics Office は現在表示されているﾎﾟｲﾝﾄだけを考慮します。これは､観測をﾌｨﾙﾀｰするために｢ﾌｨﾙﾀｰを表示｣ﾀﾞｲｱﾛｸﾞを使用するとそれは選択されないことを意味します。測量表示を使用している場合､ﾚｲﾔｰ情報（計画表示で有効）は選択規準で無視されます。

計画表示を使用してこのﾀﾞｲｱﾛｸﾞにｱｸｾｽする場合には､Trimble Geomatics Office は現在表示されておりﾛｯｸされていないﾎﾟｲﾝﾄだけを考慮します。計画表示を使用している場合､測量表示で適用された表示ﾌｨﾙﾀｰのすべては無視されます。

以下のﾀﾌﾞがあります。

一般

GPS

観測

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択されている場合､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞ　－　一般ﾀﾌﾞ

このﾀﾌﾞを使用して､一般ﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞに規準を入力します。

｢名前の一致｣と｢特徴ｺｰﾄﾞの一致｣

こういったﾌｨｰﾙﾄﾞを使用して､名前（と特徴ｺｰﾄﾞ）によって選択します。名前をｶﾝﾏで区切って入力することができます。例えば｢100,250,1020｣は､こういった名前がﾌﾟﾛｼﾞｪｸﾄ内に存在する場合にそれを個々に選択することです。省略符号(...)やﾀﾞｯｼｭ記号(-)は､範囲内の特定された名前を持つすべてのﾎﾟｲﾝﾄを選択します。

範囲が英数字の名前を含む場合､完全なｱﾙﾌｧﾍﾞｯﾄ順の分類が使用されるので､予想外のいくつかのｴﾝﾃｨﾃｨが選択されるかもしれません。

注:範囲開始と終了の名前が数字の場合､数字範囲が選択されます。

こういったﾌｨｰﾙﾄﾞでﾜｲﾙﾄﾞｶｰﾄﾞを使用することができます。

注:名前がﾊｲﾌﾝを含む場合には､引用語句内にﾊｲﾌﾝを含めます。例えば､ﾎﾟｲﾝﾄ名｢a-2｣は｢a-2｣と入力されます。そうでないと､Trimble Geomatics Office はaから2までの範囲を分類します。

二重引用語句を使用して､ﾜｲﾙﾄﾞｶｰﾄﾞ文字を含む名前が一致するﾊﾟﾀｰﾝを防止します。例えば､"URS#1"..."URS#8"は､選択範囲内でﾜｲﾙﾄﾞｶｰﾄﾞとして#が使用されるのを防止し､URS#1とURS#8の間の陽関数表示の名前を持つﾎﾟｲﾝﾄを選択します。

名前は､大文字と小文字の別にこだわりません。

ﾎﾟｲﾝﾄの質

一覧から､規準内のﾎﾟｲﾝﾄﾎﾟｼﾞｼｮﾝ構成の質を選択します。複数のﾎﾟｲﾝﾄの質を選択することができます。

ｿｰｽから

一覧からﾎﾟｲﾝﾄｿｰｽを選択します。複数のｿｰｽを選択することができます。少なくとも1つの選択ｿｰｽから測量ﾃﾞｰﾀを持つﾎﾟｲﾝﾄが選択されます。

特徴ｺｰﾄﾞ

ﾎﾟｲﾝﾄを選択するのに使用される特徴ｺｰﾄﾞを入力します。

ﾚｲﾔｰから

測量表示からこのﾀﾞｲｱﾛｸﾞにｱｸｾｽする場合には､このｵﾌﾟｼｮﾝは利用できません。

このﾘｽﾄを使用して､基準内のﾚｲﾔｰを選択します。複数のﾚｲﾔｰを選択することができます。選択されたﾚｲﾔｰ内のすべてのﾎﾟｲﾝﾄが選択されます。

ﾎﾟｲﾝﾄｽﾀｲﾙ

一覧から､規準内のﾎﾟｲﾝﾄCADｽﾀｲﾙを選択します。複数のﾎﾟｲﾝﾄｽﾀｲﾙを選択することができます。そのﾎﾟｲﾝﾄｽﾀｲﾙ（ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ-CAD ﾀﾌﾞで特定された）を持つすべてのﾎﾟｲﾝﾄが選択されます。

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択される場合には､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞ　－　GPSﾀﾌﾞ

このﾀﾌﾞを使用して､GPSﾃﾞｰﾀを使用して選択規準を入力します。規準は､後処理とRTK GPS基線の両方に適用します。

規準を満たす基線を少なくとも1つのﾎﾟｲﾝﾄが持つ場合には､ﾎﾟｲﾝﾄが選択されます。

水平精度と垂直精度

｢以下｣か｢以上｣ﾎﾞﾀﾝをｸﾘｯｸして､規準に対するｻｲﾝを選択します。

精度値を入力するためにｷｰﾎﾞｰﾄﾞを使用して値を入力します。

1つのﾌｨｰﾙﾄﾞを疑問符（?）にしておくと､そのﾌｨｰﾙﾄﾞは選択規準には使用されません。

解ﾀｲﾌﾟ

規準内の解ﾀｲﾌﾟを使用するには､一覧から選択します。複数の解ﾀｲﾌﾟを選択することができます。それに対するGPS観測（選択された解ﾀｲﾌﾟを伴う）を持つﾎﾟｲﾝﾄすべてが選択されます。

ﾌｨｰﾙﾄﾞ方法

一覧から､規準内で使用したいﾌｨｰﾙﾄﾞ方法を選択します。複数のﾌｨｰﾙﾄﾞ方法を選択することができます。

注:解ﾀｲﾌﾟとﾌｨｰﾙﾄﾞ方法の両方を満たすﾎﾟｲﾝﾄだけが選択されます。

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択される場合には､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞ　－　観測ﾀﾌﾞ

観測詳細を使用して選択規準を入力するのに､このﾀﾌﾞを使用します。基準を満たす､少なくとも1つの観測を持つﾎﾟｲﾝﾄすべてが選択されます。

全基準局と機器設定

このﾁｪｯｸﾎﾞｯｸｽをｵﾝにして､すべてのGPS基準局ﾎﾟｲﾝﾄと地上設定ﾎﾟｲﾝﾄを選びます。

ｱﾝﾃﾅやﾀｰｹﾞｯﾄの高度差

こういったﾌｨｰﾙﾄﾞを使用して､規準にｱﾝﾃﾅ高度やﾀｰｹﾞｯﾄ高度を入力します。最初のﾌｨｰﾙﾄﾞに入力する値は､第二のﾌｨｰﾙﾄﾞに入力する値より小さくなくてはなりません。入力される値自身も含まれます。

観測時間

このﾁｪｯｸﾎﾞｯｸｽをｵﾝにして､規準で使用する日付と時刻の範囲を入力します。この範囲内の開始と終了時間を持つﾎﾟｲﾝﾄに対する観測が選択されます。ｿﾌﾄｳｪｱは､次回このｵﾌﾟｼｮﾝを使用する時のために入力する値を保存します。

観測を行うﾎﾟｲﾝﾄ

観測を行うﾎﾟｲﾝﾄ名を入力します。GPS基準局と地上設定ﾎﾟｲﾝﾄのどちらもがﾎﾟｲﾝﾄになることができます。

ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳでﾎﾟｲﾝﾄを選択するためにﾌｨｰﾙﾄﾞ記入を使用します。

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択される場合には､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


ｴﾝﾃｨﾃｨの選択　－　ﾜｲﾙﾄﾞｶｰﾄﾞの使用

概要と詳細

選択/ﾎﾟｲﾝﾄﾀﾞｲｱﾛｸﾞを使用してﾎﾟｲﾝﾄを選択したり､選択/観測ﾀﾞｲｱﾛｸﾞを使用して観測を選択したりする時､値の範囲を選択するためにいくつかのﾌｨｰﾙﾄﾞでﾜｲﾙﾄﾞｶｰﾄﾞを使用することができます。

以下のﾜｲﾙﾄﾞｶｰﾄﾞを使用することができます。

複数のﾜｲﾙﾄﾞｶｰﾄﾞを使用することもできます。例えば､1?0*0は1500､1A0250､15020と一致します。

以下の表は､ﾊﾟﾀｰﾝをﾃｽﾄするために一致する種類をどのように使用するかを示してくれます。

ﾎﾟｲﾝﾄ名｢10｣は｢1｣と｢a｣の間にあると扱われます。両方の名前が数字なので｢1｣から｢9｣の範囲には当てはまりません。


観測ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､｢観測を選択｣ﾀﾞｲｱﾛｸﾞを開きます。

それを行うには､選択/観測を選びます。


｢観測を選択｣ﾀﾞｲｱﾛｸﾞ

詳細

概要	使用方法

それを行うには､選択/観測を選びます。

特定された規準を使用して観測を選択するために､このﾀﾞｲｱﾛｸﾞを使用します。ﾜｲﾙﾄﾞｶｰﾄﾞと範囲を使用することができます。複数のﾀﾌﾞに規準を入力することもできます。Trimble Geomatics Office はすべての規準を満たす観測だけを選択します。

以下のﾀﾌﾞがあります。

一般

GPS

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択される場合には､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢観測を選択｣ﾀﾞｲｱﾛｸﾞ　－　一般ﾀﾌﾞ

このﾀﾌﾞを使用して､観測を選択するための一般規準を入力します。

｢一致するﾎﾟｲﾝﾄから｣､｢一致するﾎﾟｲﾝﾄまで｣

ｶﾝﾏで区切られた名前を入力することができます。省略符号(...)やﾀﾞｯｼｭ記号(-)は､省略記号で示された範囲内で特定された名前を持つすべてのﾎﾟｲﾝﾄを選択します。範囲が英数字の名前を含む場合､完全なｱﾙﾌｧﾍﾞｯﾄ順の分類が使用されるので､予想外のいくつかのｴﾝﾃｨﾃｨが選択されるかもしれません。

注:範囲開始と終了の名前が数字の場合､数字範囲が選択されます。

ﾜｲﾙﾄﾞｶｰﾄﾞを使用することができます。

斜距離差

こういったﾌｨｰﾙﾄﾞを使用して､規準内に斜距離範囲を入力できます。最初のﾌｨｰﾙﾄﾞに入力する値は､第二のﾌｨｰﾙﾄﾞに入力する値より小さくなくてはなりません。入力される値自身も含まれます。

特定された範囲内に水平距離を持つ標高観測がある場合､観測も選択されます。

この一覧から観測ﾀｲﾌﾟを選択します。例えば､RTKやﾚｰｻﾞｰ､方位角観測を選択することができます。

ｿｰｽから

一覧から､観測ｿｰｽを選択します。複数のｿｰｽを選択することができます。少なくとも1つの観測ｿｰｽを持つ観測すべてが選択されます。

ｽﾃｰﾀｽ

一覧から､規準内の観測ｽﾃｰﾀｽを選択します。

観測ID

観測を選択するために､1つの観測IDか一連の観測IDを入力します。例えば､GPS基線8を選択するためにはB8を入力します。その範囲内のすべての観測を選択するには､B8−B12と入力します。

ｻｲﾄﾞｼｮｯﾄのみ

このﾁｪｯｸﾎﾞｯｸｽがｵﾝにされると､ｻｲﾄﾞｼｮｯﾄのみが選択されます。

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択される場合には､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢観測を選択｣ﾀﾞｲｱﾛｸﾞ　－　GPSﾀﾌﾞ

GPS基線を選択するための規準を入力するために､このﾀﾌﾞを使用します。

ﾗｼｵ

｢未満｣か｢より大きい｣のｻｲﾝを選択します。規準で使用したいﾗｼｵ値を入力します。

基準分散

｢未満｣か｢より大きい｣のｻｲﾝを選択します。規準で使用したい基準分散を入力します。

RMS

｢未満｣か｢より大きい｣のｻｲﾝを選択します。規準で使用したいRMS値を入力します。

水平精度

｢以下｣か｢以上｣ﾎﾞﾀﾝをｸﾘｯｸして､規準に対するｻｲﾝを選択します。規準で使用したい水平精度値を入力します。

垂直精度

｢以下｣か｢以上｣ﾎﾞﾀﾝをｸﾘｯｸして､規準に対するｻｲﾝを選択します。規準で使用したい垂直精度値を入力します。

注:水平精度と垂直精度ｸｴﾘｰは精確な値を使用します。ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳのﾌｨｰﾙﾄなどで表示される値は概数を使用します。

解ﾀｲﾌﾟ

一覧から規準で使用したい解ﾀｲﾌﾟを選択します。複数の解ﾀｲﾌﾟを選択することができます。

ﾌｨｰﾙﾄﾞ方法

一覧から､規準で使用したいﾌｨｰﾙﾄﾞ方法を選択します。複数のﾌｨｰﾙﾄﾞ方法を選択することができます。

注:解ﾀｲﾌﾟとﾌｨｰﾙﾄﾞ方法の両方を満たすﾎﾟｲﾝﾄだけが選択されます。

観測期間

このﾌｨｰﾙﾄﾞで､規準に対する日付と時刻の範囲を特定することができます。特定された規準内の開始と終了時間を持つ観測が選択されます。ｿﾌﾄｳｪｱは､次回このｵﾌﾟｼｮﾝを使用する時のために入力する値を保存します。

以下より長い観測（秒）

このﾌｨｰﾙﾄﾞを使用して､特定した時間を超えて観測されたGPS基線を選択します。ﾌｨｰﾙﾄﾞは､hh:mm:ssのﾌｫｰﾏｯﾄを持ちます。

注:時間を特定するのにﾌｨｰﾙﾄﾞ記入を使用できます。

現在の選択に追加

このﾀﾞｲｱﾛｸﾞにｱｸｾｽする時に複数のｴﾝﾃｨﾃｨが選択される場合には､このﾁｪｯｸﾎﾞｯｸｽを利用できます。このﾀﾞｲｱﾛｸﾞの結果として起こる選択を適用する前に現在の選択を取り消したい場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ﾚｲﾔ－で｣ｺﾏﾝﾄﾞ
｢ﾚｲﾔｰで｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､特定したﾚｲﾔｰ内のすべてのｴﾝﾃｨﾃｨを選択します。

それを行うには､

選択/ﾚｲﾔｰでを選びます。

ﾚｲﾔｰで選択ﾀﾞｲｱﾛｸﾞが開きます。


｢ﾚｲﾔｰで選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､選ばれたﾚｲﾔｰ内のｴﾝﾃｨﾃｨを選択します。

それを行うには､

選択/ﾚｲﾔｰでを選びます。

ﾚｲﾔｰ

ﾚｲﾔｰ一覧は､ﾌﾟﾛｼﾞｪｸﾄ内のﾚｲﾔｰの名前を示します。

ﾚｲﾔｰに表示されるｴﾝﾃｨﾃｨを選択するには､ﾚｲﾔｰ名の脇のﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

ﾚｲﾔｰがそのﾛｯｸﾌﾟﾛﾊﾟﾃｨをｵﾝに設定してあるか､表示ﾌﾟﾛﾊﾟﾃｨをｵﾌに設定してある場合には､ﾚｲﾔｰに対するﾁｪｯｸﾎﾞｯｸｽは影付きで表示されます。ﾚｲﾔｰを選択できるようにするには､ﾛｯｸﾌﾟﾛﾊﾟﾃｨや表示ﾌﾟﾛﾊﾟﾃｨを変更するために､ﾚｲﾔｰ選択ﾂｰﾙやﾚｲﾔｰﾀﾞｲｱﾛｸﾞを使用します。それを行うことでﾚｲﾔｰのﾁｪｯｸﾎﾞｯｸｽを利用できるようになります。

すべて

すべてをｸﾘｯｸして､ﾚｲﾔｰ一覧に表示されるすべてのﾚｲﾔｰを選択します。

なし

なしをｸﾘｯｸして､ﾚｲﾔｰ一覧のすべてのﾚｲﾔｰのﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ｽﾀｲﾙで｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､特定されたｽﾀｲﾙを使用するすべてのｴﾝﾃｨﾃｨを選択します。

それを行うには､選択/ｽﾀｲﾙでを選びます。

ｽﾀｲﾙで選択ﾀﾞｲｱﾛｸﾞが開きます。


｢ｽﾀｲﾙで選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ｽﾀｲﾙが特定された計画表示内のすべてのCADｴﾝﾃｨﾃｨ（ﾎﾟｲﾝﾄ､ﾗｲﾝ､円弧､曲線､注釈､ﾃｷｽﾄ）を選択します。

それを行うには､選択/ｽﾀｲﾙでを選びます。

ｽﾀｲﾙ

特定のｽﾀｲﾙﾀｲﾌﾟのﾀﾌﾞを選択します。ｽﾀｲﾙは､CADｽﾀｲﾙﾀﾞｲｱﾛｸﾞと同一なものが有効です。表示される一覧からｽﾀｲﾙを選択します。ｴﾝﾃｨﾃｨを選択するためには1つのﾀﾌﾞしか使用できません。1つのﾀﾌﾞで複数のｽﾀｲﾙを選択してから他のﾀﾌﾞを選ぶと､前のﾀﾌﾞで行った選択のすべては失われます。

複数のｴﾝﾃｨﾃｨﾀｲﾌﾟ（例えば､ﾎﾟｲﾝﾄとﾗｲﾝ）を選択するには､選択を行うためにこのﾀﾞｲｱﾛｸﾞを使用し､選択ｾｯﾄを保存してから､その他のｴﾝﾃｨﾃｨﾀｲﾌﾟを選択します。新しい選択ｾｯﾄを保存します。選択/選択ｾｯﾄ/回復を使用して両方の選択ｾｯﾄを同時に回復できます。

｢ﾚｲﾔｰで｣ｵﾌﾟｼｮﾝを使用して､｢ﾚｲﾔｰで｣に設定された適切なﾌｨｰﾙﾄﾞを持つｴﾝﾃｨﾃｨを選択します。

すべて

すべてをｸﾘｯｸして､ｽﾀｲﾙ一覧ﾎﾞｯｸｽに表示されるすべてのｽﾀｲﾙを選択します。

なし

なしをｸﾘｯｸして､ｽﾀｲﾙ一覧ﾎﾞｯｸｽに表示されるｽﾀｲﾙすべてのﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ﾀｲﾌﾟで｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､特定したﾀｲﾌﾟのすべてのｴﾝﾃｨﾃｨを選択します。

それを行うには､選択/ﾀｲﾌﾟでを選びます。

ﾀｲﾌﾟで選択ﾀﾞｲｱﾛｸﾞが開きます。


｢ﾀｲﾌﾟで選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､特定したﾀｲﾌﾟのｴﾝﾃｨﾃｨを選択します。

それを行うには､選択/ﾀｲﾌﾟでを選びます。

ﾀｲﾌﾟ

ﾀｲﾌﾟ一覧は､異なるｴﾝﾃｨﾃｨﾀｲﾌﾟ（ﾎﾟｲﾝﾄ､ﾗｲﾝ､円弧､曲線､注釈､ﾃｷｽﾄ）のすべての名前を表示します。

あるﾀｲﾌﾟのｴﾝﾃｨﾃｨを選択するためには､特定ﾀｲﾌﾟのﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

すべて

すべてをｸﾘｯｸして､ﾀｲﾌﾟ一覧ﾎﾞｯｸｽに表示されるすべてのﾀｲﾌﾟを選択します。

なし

なしをｸﾘｯｸして､ﾀｲﾌﾟ一覧ﾎﾞｯｸｽに表示されるすべてのﾀｲﾌﾟに対するﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。


｢ｸｴﾘ－で｣ｺﾏﾝﾄﾞ
｢ｸｴﾘｰで｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､ｸｴﾘｰで特定された条件に一致するｴﾝﾃｨﾃｨを選択します。

それを行うには､選択/ｸｴﾘｰでを選びます。

ｸｴﾘｰで選択ﾀﾞｲｱﾛｸﾞが表示されます。


｢ｸｴﾘ－で選択｣ﾀﾞｲｱﾛｸﾞ
｢ｸｴﾘｰで選択｣ﾀﾞｲｱﾛｸﾞ

概要と詳細

このﾀﾞｲｱﾛｸﾞを使用して､ｴﾝﾃｨﾃｨを選択するためのｸｴﾘｰを選びます。

それを行うには､選択/ｸｴﾘｰでを選びます。

ｸｴﾘｰ

利用できるｸｴﾘｰの一覧は､ﾌﾟﾛｼﾞｪｸﾄ内と以下で定義したあらゆるｶｽﾀﾑｸｴﾘｰを含みます。

ｸｴﾘｰ名	選択
すべてのイベント	イベントレコードのある観測
単独測位の GPS ポイント	単独測位の座標のあるポイント。例えば，解析されていない.dat ファイル内のポイント。
受信機を使用した 基線	同じ受信機を使用して観測された基線。パラメータ入力ダイアログで値を入力。
一般測量機で 観測したポイント	一般測量機器を使用して観測されたポイント
標高の範囲	指定された範囲内の標高のポイント。パラメータ入力ダイアログで値を入力。
キー入力された WGS-84 ポイント	WGS-84 でキー入力されたポイント。
レーザー測距儀の ポイント	レーザー測距儀を使用して観測されたポイント。
注記	プロジェクトのすべての注記レコード。注記はTrimble Survey Controller の使用時にフィールドで入力可能。この選択オプションを使用してカスタムレポート作成のため注記を選択。
ヌルの座標	ヌル座標を持つポイント。これは座標のない後視を観測した場合に生じる可能性がある。
ヌルの標高	ヌルの標高を持つポイント。
説明のあるポイント	指定した説明と同じ説明フィールドのあるポイント。パラメータ入力ダイアログで値を入力。ワイルドｶード文字も使用可能。
複数回観測された ポイント	2回以上観測されたポイント。このクエリーはすべての観測タイプを使用。一般測量機観測ではクエリーはターゲット設置を使用。RTK 観測ではポイントのGPS 観測を使用。静止・高速静止観測では観測の終点であるポイントの観測を使用。クエリーは以上のすべてを合計し，合計が2以上のポイントを選択。
距離内の異なる 名前のポイント	異なる名前の指定された距離内のポイント。パラメータ入力ダイアログで値を入力。
名前のないポイント	名前のないポイント。
共分散(QC2 )のある RTK ベクトル	QC2 レコードを持つRTK ベクトル。これらのポイントは網平均で使用される(網平均モジュールがインストールされている場合)。
解析していない基線	存在するが解析されていない基線。

ｸｴﾘｰは､ｸｴﾘｰ定義に従ってｴﾝﾃｨﾃｨを選択し､ｸｴﾘｰの説明はｽﾃｰﾀｽﾊﾞｰに表示されます。

例えば､特定範囲の標高を持つﾎﾟｲﾝﾄを選択できます。

ｸｴﾘｰがﾊﾟﾗﾒｰﾀを必要とする場合､名前の後ろに省略記号が続きます。そのようなｸｴﾘｰを選ぶ場合には､ﾊﾟﾗﾒｰﾀ値を提供することを要求されます。

選択

選択ｸﾞﾙｰﾌﾟで､3つの選択作業を実行することができます。

新規−新しい選択ｾｯﾄを作成します。

現在の選択に追加−現在の選択ｾｯﾄに作成しようとしている選択ｾｯﾄを追加します。

現在の選択から絞込−現在の選択ｾｯﾄを使用して､作成しようとしている選択ｾｯﾄと共通のﾎﾟｲﾝﾄを見つけます。

例えば､ｼﾘｱﾙﾅﾝﾊﾞｰ1234を持つGPSﾚｼｰﾊﾞｰを使用して観測された未処理の基線すべてを見つけたいﾌﾟﾛｼﾞｪｸﾄを持つ場合､以下を行います。

1.	ｸｴﾘｰを使用して､未処理の基線すべてを選択します。

2.	ﾚｼｰﾊﾞｰｵﾌﾟｼｮﾝを使用して基線を選択するために､再びｸｴﾘｰを使用します。

3.	選択ｸﾞﾙｰﾌﾟで､｢現在の選択から絞込｣ｵﾌﾟｼｮﾝを選択します。

4.	｢ｸｴﾘｰで選択　－　ﾊﾟﾗﾒｰﾀ｣ﾀﾞｲｱﾛｸﾞでﾚｼｰﾊﾞｰのｼﾘｱﾙﾅﾝﾊﾞｰ(1234)を入力します。

ﾚｼｰﾊﾞｰ1234で観測された未処理の基線すべてが選択されます。


｢ﾎﾟｲﾝﾄ特徴で｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､特定する名前が一致する､属性を持つ特徴ｺｰﾄﾞを持つﾎﾟｲﾝﾄを選択します。

それを行うには､選択/ﾎﾟｲﾝﾄ特徴でを選びます。

｢ﾎﾟｲﾝﾄ特徴で選択｣ﾀﾞｲｱﾛｸﾞが表示されます。


｢ﾎﾟｲﾝﾄ特徴で選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､それに対して収集された特徴と属性情報を持つﾎﾟｲﾝﾄを選択します。ﾎﾟｲﾝﾄに対して収集された特徴と属性見るには､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ－属性ﾀﾌﾞを使用します。

特徴

特徴一覧は､属性のためにﾌﾟﾛｼﾞｪｸﾄを設定するのに使用した特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙかﾃﾞｰﾀ辞書(*.ddf)ﾌｧｲﾙ内に存在する属性定義を持つ特徴のすべてを表示します。

特徴に対するﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。少なくとも1つの特徴が特定されたﾎﾟｲﾝﾄが選択されます。

すべて

すべてのﾁｪｯｸﾎﾞｯｸｽをｵﾝにするには､すべてをｸﾘｯｸします。

なし

すべてのﾁｪｯｸﾎﾞｯｸｽをｵﾌにするには､なしをｸﾘｯｸします。


選択ｾｯﾄ　－　概要

詳細

利用方法

概要

選択ｾｯﾄとは､Trimble Geomatics Office で現在選択されたものです。現在の選択ｾｯﾄをいつでも保存し､後で回復することができます。例えば､ﾌﾟﾛｼﾞｪｸﾄ内のすべてのｺﾝﾄﾛｰﾙﾎﾟｲﾝﾄの選択ｾｯﾄを記録し､選択ｾｯﾄを回復することで定期的にそれを報告することができます。こういった保存された選択ｾｯﾄは､そのｴﾝﾃｨﾃｨの順序を保持します。選択ｾｯﾄの一部であるｴﾝﾃｨﾃｨを削除しても､選択ｾｯﾄは残存するｴﾝﾃｨﾃｨと一緒に働きます。

注:｢ﾌｨﾙﾀｰの表示｣ﾀﾞｲｱﾛｸﾞで｢選択ｾｯﾄでﾃﾞｰﾀのみを表示｣ｵﾌﾟｼｮﾝを使用して選択ｾｯﾄを表示することができます。

ﾌｧｲﾙをｲﾝﾎﾟｰﾄすると､Trimble Geomatics Office は自動的に名前の付いた選択ｾｯﾄを生成します。選択ｾｯﾄは､ﾃﾞｰﾀが収集された順序を記録します。これは､特徴ｺｰﾄﾞ付けのようなﾀｽｸには重要です。Survey Controller (*.dc)ﾌｧｲﾙに対しては､Trimble Geomatics Office は新しい選択ｾｯﾄにｲﾝﾎﾟｰﾄするｼﾞｮﾌﾞ識別子の名前を与えます。他のﾌｧｲﾙ（ASCIIﾌｧｲﾙなど）に対しては､Trimble Geomatics Office は新しい選択ｾｯﾄにﾌｧｲﾙの名前を与えます。

注: 最初の15分以内にその初期化が失われたRTKﾃﾞｰﾀをｲﾝﾎﾟｰﾄする場合､高いRMS選択ｾｯﾄがｲﾝﾎﾟｰﾄ中に作成されます。


選択ｾｯﾄ　－　保存ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､現在の選択ｾｯﾄを保存します。

それを行うには､

選択/選択ｾｯﾄ/保存を選びます。

保存ﾀﾞｲｱﾛｸﾞが表示されます。

現在何も選択されていない時には､このｺﾏﾝﾄﾞは利用できません。


選択ｾｯﾄ　－　保存ﾀﾞｲｱﾛｸﾞ

概要と詳細

このﾀﾞｲｱﾛｸﾞを使用して､現在の選択ｾｯﾄを保存します

それを行うには､選択/選択ｾｯﾄ/保存を選びます。

名前

選択ｾｯﾄに対して独特の名前を入力します。

OK

OKをｸﾘｯｸして選択ｾｯﾄを作成します。

選択ｾｯﾄは､次にそれを開く時に回復ﾀﾞｲｱﾛｸﾞに表示されます。新しい選択ｾｯﾄは､最近使用された選択ｾｯﾄ一覧に追加されます。回復ﾀﾞｲｱﾛｸﾞを開いて､最近使用された選択ｾｯﾄを見るには､選択/選択ｾｯﾄを選びます。


選択ｾｯﾄ　－　回復ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､選択ｾｯﾄを回復します。回復する選択ｾｯﾄがない場合には､このｺﾏﾝﾄﾞは利用できません。

それを行うには､

選択/選択ｾｯﾄ/回復を選びます。

選択ｾｯﾄ－回復ﾀﾞｲｱﾛｸﾞが表示されます。


選択ｾｯﾄ　－　回復ﾀﾞｲｱﾛｸﾞ

概要と詳細

このﾀﾞｲｱﾛｸﾞを使用して､1つか複数の選択ｾｯﾄを一度に回復します。例えば2つの保存された選択ｾｯﾄを持つ場合､両方の選択ｾｯﾄすべてのｴﾝﾃｨﾃｨを選択するためにこのﾀﾞｲｱﾛｸﾞを使用します。

それを行うには､選択/選択ｾｯﾄ/回復を選びます。

選択ｾｯﾄ

この一覧は､ﾌﾟﾛｼﾞｪｸﾄに対して保存されたすべての選択ｾｯﾄを含みます。

すべて

すべての選択ｾｯﾄを選択するには､すべてをｸﾘｯｸします。

なし

すべての選択ｾｯﾄに対するﾁｪｯｸﾎﾞｯｸｽをｵﾌにするには､なしをｸﾘｯｸします。


選択ｾｯﾄ　－　編集ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､保存した選択ｾｯﾄの詳細を編集します。編集する選択ｾｯﾄがない場合には､このｺﾏﾝﾄﾞは利用できません。

それを行うには､選択/選択ｾｯﾄ/編集を選びます。

編集ﾀﾞｲｱﾛｸﾞが表示されます。


選択ｾｯﾄ　－　編集ﾀﾞｲｱﾛｸﾞ

概要と詳細

このﾀﾞｲｱﾛｸﾞを使用して､保存した選択ｾｯﾄの名前を変更したり､削除したりします。

選択ｾｯﾄ

編集や削除を行いたい選択ｾｯﾄを反転表示します。

名前の変更

名前の変更をｸﾘｯｸして､反転表示された選択ｾｯﾄの名前を変更します。

削除

削除をｸﾘｯｸして､反転表示された選択ｾｯﾄを削除します。


選択ｾｯﾄ　－　名前の変更ﾀﾞｲｱﾛｸﾞ

概要と詳細

このﾀﾞｲｱﾛｸﾞを使用して､反転表示された選択ｾｯﾄの名前を変更します。

それを行うには､

1.	選択/選択ｾｯﾄ/編集を選びます。編集ﾀﾞｲｱﾛｸﾞが表示されます。

2.	名前の変更をｸﾘｯｸします。名前の変更ﾀﾞｲｱﾛｸﾞが表示されます。

名前

選択ｾｯﾄに対する独特な名前を入力します。

OK

変更を適用するためにOKをｸﾘｯｸします。

編集ﾀﾞｲｱﾛｸﾞに選択ｾｯﾄが表示されます。新しい選択ｾｯﾄが､最近使用された選択ｾｯﾄ一覧に表示されます。


ｴﾝﾃｨﾃｨの選択　－　概要

時によっては､ﾌﾟﾛｼﾞｪｸﾄのｻﾌﾞｾｯﾄ（例えば､特徴ｺｰﾄﾞの処理）にだけｱｸｼｮﾝを実行したいことがあります。ﾌﾟﾛｼﾞｪｸﾄ内のｴﾝﾃｨﾃｨ（ﾎﾟｲﾝﾄ､ﾗｲﾝ､円弧､曲線､ﾃｷｽﾄ､注釈､観測）を選択するには2通りあります。

ﾏｳｽの使用

選択ﾒﾆｭｰの使用

ﾏｳｽを使用してｴﾝﾃｨﾃｨを選択

ｴﾝﾃｨﾃｨを選択するには､ﾏｳｽを使用してそれをｸﾘｯｸします。（複数のｴﾝﾃｨﾃｨを選択するには､同時にShiftを押します。）

そこで選択されたｴﾝﾃｨﾃｨに必要なﾀｽｸを実行することができます。

反転選択を行うには､Ctrlを押します。現在選択されているｴﾝﾃｨﾃｨは非選択となり､選択されていなかったｴﾝﾃｨﾃｨが選択されるようになります。

注:ｴﾝﾃｨﾃｨを何度も選択せずに､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳにｴﾝﾃｨﾃｨを表示するためにﾏｳｽを使用することができます。ﾎﾟｲﾝﾄ上でﾏｳｽﾎﾞﾀﾝを数秒押し続けてから､表示したいｴﾝﾃｨﾃｨにﾎﾟｲﾝﾀｰをﾄﾞﾗｯｸﾞします。

選択ﾒﾆｭｰを使用してｴﾝﾃｨﾃｨを選択

選択ﾒﾆｭｰは､多くの異なるﾎﾟｲﾝﾄ選択方法を含みます。選択ﾒﾆｭｰのｵﾌﾟｼｮﾝは､測量表示と計画表示のどちらに現在いるかによって異なります。


重複ﾎﾟｲﾝﾄ　－　｢座標で｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､同一の座標を持つﾎﾟｲﾝﾄを選択します。

それを行うには､選択/重複ﾎﾟｲﾝﾄ/座標でを選びます。


重複ﾎﾟｲﾝﾄ　－　｢名前で｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､重複する名前を持つﾎﾟｲﾝﾄを選択します。

それを行うには､

選択/重複ﾎﾟｲﾝﾄ/名前でを選びます。

ﾋﾝﾄ:重複ﾎﾟｲﾝﾄの結合の前にこのｺﾏﾝﾄﾞを使用します。


重複ﾎﾟｲﾝﾄ　－　｢名前と距離で｣ｺﾏﾝﾄﾞ

このｺﾏﾝﾄﾞを使用して､重複する名前を持ち､特定された距離内のﾎﾟｲﾝﾄを選択します。ﾊﾟﾗﾒｰﾀｴﾝﾄﾘﾀﾞｲｱﾛｸﾞに値を入力します。

それを行うには､

選択/重複ﾎﾟｲﾝﾄ/名前と距離でを選びます。


｢杭打ちしたﾎﾟｲﾝﾄ選択｣ﾀﾞｲｱﾛｸﾞ

一連のｸｴﾘｰを使用して杭打ちしたﾎﾟｲﾝﾄを選択するために､このﾀﾞｲｱﾛｸﾞを使用します。こういった選択ﾂｰﾙは､追加ﾚﾎﾟｰﾄやｶｽﾀﾑｴｸｽﾎﾟｰﾄｵﾌﾟｼｮﾝと一緒に使用することができます。

それを行うには､選択/杭打ちしたﾎﾟｲﾝﾄを選びます。

ｸｴﾘｰ

利用可能なｸｴﾘｰの一覧には､以下のものだけでなく､ﾌﾟﾛｼﾞｪｸﾄ内で定義したｶｽﾀﾑｸｴﾘｰも含まれます。

ｸｴﾘｰ名	選択	｢ﾊﾟﾗﾒｰﾀ ｴﾝﾄﾘ｣ﾀﾞｲｱﾛｸﾞに この情報を入力
杭打ちしたﾎﾟｲﾝﾄすべて	ﾌｨｰﾙﾄﾞで杭打ちされたﾎﾟｲﾝﾄすべて
円弧ﾎﾟｲﾝﾄ	円弧に関係あるﾎﾟｲﾝﾄ。例えば､円弧上/から/に杭打ちされたﾎﾟｲﾝﾄ。	円弧名
DTMﾎﾟｲﾝﾄ	DTMに関係あるﾎﾟｲﾝﾄ。例えば､DTM上/から/に杭打ちされたﾎﾟｲﾝﾄ。	DTM名
ﾗｲﾝﾎﾟｲﾝﾄ	ﾗｲﾝに関係あるﾎﾟｲﾝﾄ。例えば､ﾗｲﾝ上/から/に杭打ちされたﾎﾟｲﾝﾄ。	ﾗｲﾝ名
設計ﾎﾟｲﾝﾄ	設計ﾎﾟｲﾝﾄに関係あるﾎﾟｲﾝﾄ。例えば､設計ﾎﾟｲﾝﾄ上/から/に杭打ちされたﾎﾟｲﾝﾄ。	設計ﾎﾟｲﾝﾄ名
道路ﾎﾟｲﾝﾄ	道路ﾎﾟｲﾝﾄに関係あるﾎﾟｲﾝﾄ。例えば､道路上/から/に杭打ちされたﾎﾟｲﾝﾄ。	道路名
道路に対するｷｬｯﾁﾎﾟｲﾝﾄ	道路に対するｷｬｯﾁﾎﾟｲﾝﾄ	道路名
特徴を持つ道路上のﾎﾟｲﾝﾄ	特徴を持つ道路上のﾎﾟｲﾝﾄ	道路名と特徴
以下より大きい杭打ちｴﾗｰを持つﾎﾟｲﾝﾄすべて	ﾊﾟﾗﾒｰﾀｴﾝﾄﾘﾀﾞｲｱﾛｸﾞで特定された水平ｴﾗｰと垂直ｴﾗｰ以上の杭打ちｴﾗｰを持つﾎﾟｲﾝﾄ
ｸｴﾘｰがﾊﾟﾗﾒｰﾀを必要とする場合､名前の後ろに省略記号が続きます。こういったｸｴﾘｰの1つを選ぶ場合には､ﾊﾟﾗﾒｰﾀ値を提供することを要求されます。

選択

選択ｸﾞﾙｰﾌﾟで､3つの選択作業を実行することができます。

新規−新しい選択ｾｯﾄを作成します。

現在の選択に追加−現在の選択ｾｯﾄに作成しようとしている選択ｾｯﾄを追加します。

現在の選択から絞込−現在の選択ｾｯﾄを使用して､作成しようとしている選択ｾｯﾄと共通のﾎﾟｲﾝﾄを見つけます。

例えば､ｼﾘｱﾙﾅﾝﾊﾞｰ1234を持つGPSﾚｼｰﾊﾞｰを使用して観測された未処理基線すべてを見つけたいﾌﾟﾛｼﾞｪｸﾄがある場合､以下を行います。

1.	ｸｴﾘｰを使用して､未処理基線すべてを選択します。

2.	ﾚｼｰﾊﾞｰｵﾌﾟｼｮﾝを使用して基線を選択するために､再びｸｴﾘｰを使用します。選択ｸﾞﾙｰﾌﾟで､｢現在の選択から絞込｣ｵﾌﾟｼｮﾝを選択します。｢ｸｴﾘｰで選択　－　ﾊﾟﾗﾒｰﾀ｣ﾀﾞｲｱﾛｸﾞでﾚｼｰﾊﾞｰのｼﾘｱﾙﾅﾝﾊﾞｰ(1234)を入力します。

ﾚｼｰﾊﾞｰ1234で観測された未処理基線すべてが選択されます。


ｷｬﾘﾌﾞﾚ－ｼｮﾝﾎﾟｲﾝﾄの選択
ｷｬﾘﾌﾞﾚｰｼｮﾝ ﾎﾟｲﾝﾄの選択

このｵﾌﾟｼｮﾝを使用して､Trimble Geomatics OfficeﾌﾟﾛｼﾞｪｸﾄのGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ−ﾎﾟｲﾝﾄ一覧に表示されるｷｬﾘﾌﾞﾚｰｼｮﾝﾎﾟｲﾝﾄを選択します。

それを行うには､選択/ｷｬﾘﾌﾞﾚｰｼｮﾝﾎﾟｲﾝﾄを選びます。

｢GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ－ﾎﾟｲﾝﾄ一覧｣に表示されるすべてのｷｬﾘﾌﾞﾚｰｼｮﾝﾎﾟｲﾝﾄがﾌﾟﾛｼﾞｪｸﾄ内で選択されます。

注:ｷｬﾘﾌﾞﾚｰｼｮﾝﾎﾟｲﾝﾄ一覧にﾎﾟｲﾝﾄがない場合には､このｵﾌﾟｼｮﾝは利用できません。


ﾃｸﾆｶﾙｻﾎﾟｰﾄ

何らかの問題が発生し､それに関する情報が製品ﾏﾆｭｱﾙの中に見つからない場合には､お近くの取り扱い代理店までお問い合わせください。ﾄﾘﾝﾌﾞﾙ社のWorld Wide Webｻｲﾄを使用してﾃｸﾆｶﾙｻﾎﾟｰﾄを依頼することもできます。(www.trimble.com/support/support.htm)または以下にEﾒｰﾙでお問い合わせいただけます。


ツールバー－概要

ツールバーには，2つ以上のツールがあります。ツールバーは，Trimble Geomatics Office のグラフィックウィンドウで縦線によって分けられています。ツールはよく使用するメニューコマンドへのショートカットです。

ツールの説明を表示するには，マウスポインタをツールの上に置きます。

ツールヒント

ステータスバー

Trimble Geomatics Office ウィンドウのツールバーの順序を変更するには，ウィンドウでツールバーを他の項目から分けている縦線を使用してツールバーをドラッグします。

下のツールバーは測量と平面図どちらの画面でも使用できます。

標準

表示

コントロール表示

下のツールバーは測量画面でのみ，使用できます。

フィルター

Timeline(基線解析モジュールがインストールされている場合)

Timelineプロット(基線解析モジュールがインストールされている場合)

誤差楕円コントロール(網平均モジュールがインストールされている場合)

下のツールバーは平面図画面でのみ，使用できます。

レイヤー

CAD


CAD ツールバー

CAD ツールバーは，挿入メニューの一般的な特徴を迅速に呼び出します。

このツールは�	このダイアログを開いて�	データベースに追加できる項目は�
	ポイント挿入	ポイントレコード
	方位角と距離でポイント挿入	ポイントレコード
	ライン挿入	ラインレコード
	曲線挿入	曲線レコード
	円弧挿入	円弧レコード
	テキスト挿入	テキストレコード


標準 ツールバー

標準ツールバーは，ファイル，編集メニューで使用できるいくつかの主なオプションを迅速に呼び出します。

ツール	選択して �
	新しいプロジェクトを作成します
	既存のプロジェクトを開きます
	データをファイル，装置，GPS 受信機からインポートします
	データをファイル，装置，GPS 受信機へエクスポートします
	選択を切り取り，クリップボードへ貼り付けます
	選択をコピーし，クリップボードへ貼り付けます
	クリップボードの内容を貼り付けます
	最後の操作を元へ戻します
	元へ戻された最後の操作をやり直します
	プロパティウィンドウを開き，現在の選択のプロパティを表示，編集します


レイヤー編集ツール

を選択してレイヤーダイアログを表示します。このダイアログを使用して，レイヤーを管理します。


レイヤー選択ツール

表示されているレイヤーは現在のレイヤーです。現在のレイヤーを変更するには，矢印をクリックしてドロップダウンリストからレイヤーを選択します。

電球アイコンは，レイヤーが表示されているか非表示になっているかを示します。レイヤー表示を変更するには，適切なレイヤーの電球をクリックします。

電球が薄くなります。レイヤーを表示するには，電球アイコンをもう1度クリックします。2つ以上のレイヤーの表示プロパティがオフの場合，電球アイコンがステータスバーに表示されます。

ロックアイコンは，レイヤーがロックされているかどうかを示します。ロックプロパティがオンの場合，グラフィックウィンドウに表示されていたとしても，そのレイヤーのエンティティは選択できません。

レイヤーのロックプロパティを変更するには，適切なレイヤーのロックアイコンをクリックします。レイヤーを選択可能にするには，もう1度，ロックアイコンをクリックします。1つ以上のレイヤーのロックプロパティが選択されている場合，ロックアイコンがステータスバーに表示されます。

ノート：これらのプロパティはレイヤーダイアログを使用して変更することもできます。


表示コントロールツールバー

表示コントロールツールバーは，ナビゲーションツールで，メイングラフィックウィンドウの表示を簡単にします。

下のボタンは面倒なモードを操作します。面倒なモードとは，他のボタンをクリックして他のツールを選択するまで，カーソルは選択されたツールのままであることを意味します。

ツール	選択して �
	選択モードを変更します
	ズームエリアの中心を移動します
	2倍に拡大します
	1/2 に縮小します

下のツールは面倒でないツールです。選択されるごとに操作を行います。

ツール	選択して �
	モデル全体を表示します
	前の設定にズームします
	プロジェクトバーのオン/オフの切替えます
	グラフィックウィンドウにグリッドライン表示します(この設定は表示オプションダイアログでも選択できます)


表示ツールバー

表示ツールバーのツールを使用して，下のことを行います。

このツールは �	この画面に切替えます �
	測量
	平面図


フィルターツールバー

フィルターツールバーは測量画面で使用できます。表示フィルターとTimeline  ツールがあります。

ツール	選択して �
	どの観測が表示されるか，または測量画面にどのように表示されるか決定します
	Timeline  ウィンドウを開きます
	グラフィックウィンドウの観測とTimeline  をリンクします。このツールを選択すると，現在Timeline  に表示されている後処理基線で，同時に観測された後処理基線のみを表示します。測量画面のすべてのほかの後処理基線は表示されません。 これは，独立基線を選択するのに便利なツールです。


レイヤーツールバー

レイヤーツールバーは平面図画面で使用できます。レイヤー編集ツールとレイヤー選択ツールがあります。このツールバーを使用してレイヤーを管理します。


特徴コード処理コマンド

このコマンドを使用して，特徴コードを処理します。

これを呼び出すには，ツール/特徴コード処理を選択します。

特徴コード処理ダイアログが表示されます。


特徴コード処理ダイアログ

概要

このダイアログを使用して，特徴コードを処理します。

これを呼び出すには，ツール/特徴コード処理を選択します。

特徴・属性ライブラリ

データを処理したい特徴・属性ライブラリを選択します。

参照

参照をクリックして，特徴・属性ライブラリの場所を指定します。

ノート：Trimble Geomatics Office ではすべての特徴・属性ライブラリは.fcl ファイルタイプです。特徴・属性ライブラリをTRIMMAP システム，またはSDRmap システムから選択する場合，Trimble Geomatics Office は自動的にその特徴・属性ライブラリを.fcl ファイルタイプへ変換します。

例えば，'Fclib??.dat' ファイルを選択した場合(それはTRIMMAP システム，またはSDRmap システムの特徴コードライブラリのファイル名のパターンです)，このライブラリを処理する時，Trimble Geomatics Office はライブラリを変換したいかどうか確認します。また，ライブラリを保存する名前を入力するよう，求められます。標準で与えられる名前はパターンに従ってFclib??.fcl になり，これは標準でシステムフォルダに保存されます。

Trimble Geomatics Office が変換できないコード定義を発見した場合，変換されたファイルを編集する必要があると警告されます。何かエラーが発生した場合，システムはレポートを作成します。

処理

特徴コードは選択されている順番に処理されます。

現在の選択オプションを選択して，現在選択されているエンティティを処理します。

選択セットオプションを選択してリストから選択セットを選択し，処理を行います。

使用できる選択セットがない場合，現在の選択オプションは使用できません。

OK

OKをクリックして特徴コードを処理します。

ライブラリが処理され，特徴コード処理の結果がグラフィックウィンドウに表示されます。処理中に何かエラーが発生した場合，エラーレポートを表示できます。どこでエラーが発生したかを探すには，レポートを表示します。レポートはプロジェクトのReports フォルダーに保存され，後で表示できます。


Trimble RoadLink －概要

Trimble RoadLink�はTrimble Geomatics Office のユーティリティです。サードパーティの道路定義とTrimble測量装置の間の強力なインターフェースです。

これを使用して，下の作業を行います。

データ入力

データのグラフィック表示

データ編集

そして，道路の定義をTrimble測量装置へ転送し，杭打ちに使用します。

RoadLink は，道路定義を転送する2つの方法を用意しています。

サードパーティの設計ソフトウェアから提供されたファイル（平面，縦断線形と横断面）の自動変換

道路定義のマニュアル入力（平面，縦断線形，テンプレート，片勾配）

Trimble Geomatics Office の不可欠なコンポーネントであるRoadLink は，土工事のため，道路定義とTrimble のDTMLink ユーティリティで定義された地表モデルのあいだの切土/盛土の容積計算も行ないます。


Trimble DTMLink －概要

Trimble DTMLink�はTrimble Geomatics Office のユーティリティです。このユーティリティはデジタル地形面を作成します。このソフトウェアで，サードパーティーソフトウェアによって定義された面をインポートしたり、新しい地表面を作成したり、以前作成した地表面を編集したりできます。また現場に出かけるため，こういった面をTrimble 測量装置に転送できます。

ソフトウェアにはコンター地表モデルに境界線やブレークラインを挿入する機能があります。これにより，高度な三角網編集機能が可能となり，モデルの形成をきめ細かく制御できます。

グリッド，または三角網デジタル地形モデルがコンター地表モデルから作成され，装置，またはデータファイルへエクスポートされます。

作成したモデルはTrimble RoadLink で土木工事計算のため使用することもできます。

Trimble DTMLink で容積レポートを作成できます。

容積計算の一般的な用途は：

ストックパイル(備蓄)計算

原料の層の容積，例えば，石炭層

廃棄する容積，例えば，ダム計画のある湖

DTMLink は，個々の三角錐の容積を計算する方法を使用します。これらは，三角錐の底面積と平均の高さを使用してコンター地表モデルを形成する三角面により定義されます。

DTMLink は比較面も作成できます。比較面は2つの面の間の差のコンターモデルです。この面を容積計算タイプ�標高の上�と共に使用して，2つの地表面の間の切土，盛土の容積を計算します。


開始コマンド

このコマンドはTrimble のDTMLink ユーティリティを開始します。

これを呼び出すには：

ツール/DTMLink /開始を選択します。

このコマンドを使用してDTMLink を開始し，新しい地表面を作成したり，既存の地表面を開いたりしないで，3D のAutoCAD DXF ファイルをインポートします。

これを行うには：

1.	ツール/DTMLink /開始を選択します。

2.	ファイル/インポートを選択します。

詳しくはDTMLink のヘルプをご覧ください。


新しい面コマンド

このコマンドを使用して，新しい地表モデルを作成します。

これを呼び出すには，ツール/DTMLink /新しい面を選択します。

新しい面ダイアログが表示されます。


新しい面ダイアログ

このダイアログを使用して，新しい地表モデルを作成します。

これを呼び出すには，ツール/DTMLink /新しい面を選択します。

名前

新しい地表面に適切な名前を入力します。

ポイント

ポイントオプションで，プロジェクトデータベースから地表面の形成に使用されるポイントを選択します。

データベースの現在の選択がない場合，現在の選択オプションは使用できません。

現在の選択があるとき，現在の選択オプションは現在の選択のポイントを地表面の形成に使用します。

データベース全体オプションは，すべてのデータベースポイントを地表面の形成に使用します。

選択セットオプションで，地表面の形成に使用したいポイントを保存している既存の選択セットを選択できます。

ブレークライン使用

ブレークライン使用オプションで，データベースから地表面を形成する時にブレークラインとして使用するライン等を選択できます。

地表モデル形成において，プレークラインとは一定の勾配であると考えられるラインで，モデル形成のコントロールを助けます。

これらのオプションは，ブレークライン使用オプションを選択した場合のみ使用できます。ブレークライン使用は地表面形成操作へ渡されるすべてのブレークライン情報について選択される必要があります。

選択セットオプションで，既存の選択セットのライン等を地表面形成中にブレークラインとして使用できます。レイヤーオプションで，既存のレイヤーのライン等を地表面形成中にブレークラインとして使用できます。どちらの場合も，関係するリストが使用できる選択セット，またはレイヤーのリストを表示します。

中抜境界線使用

中抜境界線使用オプションは上のブレークライン使用オプションで説明したのと同様の方法で操作します。これらのオプションは，選択セット，またはレイヤーに既存のライン等が，地表モデル形成中に除外される1つ以上の境界線の定義に使用されることを指定します。

中抜境界線は1組のラインで，地表三角形が形成されない範囲の閉じた図形を定義します。中抜境界線定義に指定されたライン等が閉じた図形を形成しない場合，地表モデル形成操作は標準的な閉じるラインを追加します。

外枠境界線使用

外枠境界線使用オプションは上の中抜境界線使用オプションで説明したのと同様の方法で操作します。これらのオプションは，選択セット，またはレイヤーに既存のライン等が，地表モデル形成中に処理される1つ以上の境界線の定義に使用されることを指定します。

外枠境界線は1組のラインで，地表三角形が形成される範囲の閉じた図形を定義します。外枠境界線の外には，三角形は形成されません。外枠境界線定義に指定されたライン等が閉じた図形を形成しない場合，地表モデル形成操作は標準的な閉じるラインを追加します。

ノート：ブレークライン，中抜境界線，外枠境界線に使用されるライン等には円弧や曲線を含みます。この場合，DTMLink は円弧や曲線を短い部分として解釈し，直線のセグメントが三角形形成に使用されます。ソフトウェアは，円弧や曲線を2センチメートル以上のラインに分割しないことを保証しています。

境界線，およびブレークラインに関する詳細は，Trimble DTMLink のオンラインヘルプをご覧ください。


既存の面コマンド

このコマンドを使用して，既存の地表モデルを編集します。

これを呼び出すには，ツール/DTMLink /既存の面を選択します。

既存の面ダイアログが表示されます。


既存の面ダイアログ

このダイアログを使用して，既存の地表モデルを編集します。このダイアログで，既存の地表面に追加したいプロジェクトのポイント，ライン等を指定できます。

これを呼び出すには，ツール/DTMLink /既存の面を選択します。

ノート：このダイアログで指定したポイント，またはライン等が既に既存の地表面にある場合，システムはこれを認知し，地表面に2度は追加しません。

名前

このフィールドはプロジェクトの既存の地表面のリストを表示します。読み込み編集したい地表面を選択します。

ポイント追加

プロジェクトのデータベースから既存の地表面に追加されるポイントを選択します。

現在のデータベース選択がない場合，現在の選択オプションは使用できません。

現在の選択があるとき，現在の設定オプションは現在選択しているポイントを既存の地表面に追加します。

データベース全体オプションは，データベースに現在あるすべてのポイントを地表モデルに渡します。これにより，データベースのすべての新しいポイントをモデルに追加します。

選択セットオプションで，地表面の形成に使用したいポイントを保存している既存の選択セットを選択できます。

ブレークライン追加

ブレークライン追加オプションで，データベースから既存の地表面にすでにあるブレークラインに追加されるライン等を選択できます。これらのオプションはブレークライン追加オプションが選択されている場合のみ，使用できます。

ブレークライン追加オプションは，既存の地表面に追加されるすべてのブレークライン情報が選択されなければなりません。地表モデル形成において，プレークラインとは一定の勾配であると考えられるラインで，モデル形成のコントロールを助けます。

選択セットオプションで，既存の選択セットからライン等を既存の地表面にブレークラインとして追加します。

レイヤーオプションで，既存の選択セットからライン等を既存の地表面にブレークラインとして追加します。

どちらの場合も，関係するリストが使用できる選択セット，またはレイヤーのリストを表示します。

中抜境界線追加

中抜境界線追加オプションは上のブレークライン追加オプションで説明したのと同様の方法で操作します。

これらのオプションは，選択セット，またはレイヤーに既存のライン等が，既存の地表面の中抜境界線定義に中抜境界線として追加されることを指定します。

中抜境界線は1組のラインで，地表三角形が形成されない範囲の閉じた図形を定義します。

中抜境界線定義に指定されたライン等が閉じた図形を形成しない場合，地表モデル形成操作は標準的な閉じるラインを追加します。

外枠境界線追加

外枠境界線追加オプションは上の中抜境界線追加オプションで説明したのと同様の方法で操作します。

これらのオプションは，選択セット，またはレイヤーに既存のライン等が，既存の地表面の外枠境界線定義に外枠境界線として追加されることを指定します。

外枠境界線は1組のラインで，地表三角形が形成される範囲の閉じた図形を定義します。外枠境界線の外には，三角形は形成されません。

外枠境界線定義に指定されたライン等が閉じた図形を形成しない場合，地表モデル形成操作は標準的な閉じるラインを追加します。

ノート：ブレークライン，中抜境界線，外枠境界線に使用されるライン等には円弧や曲線を含みます。この場合，DTMLink は円弧や曲線を短い部分として解釈し，直線のセグメントが三角形形成に使用されます。ソフトウェアは，円弧や曲線を2センチメートル以上のラインに分割しないことを保証しています。

境界線，およびブレークラインに関する詳細は，DTMLink のオンラインヘルプをご覧ください。


開始コマンド

このコマンドはTrimble のRoadLink ユーティリティを開始します。このソフトウェアを使用して，道路定義をインポート，またはマニュアル入力でき，杭打ちのためにTrimble 測量装置へ転送できます。

これを呼び出すには：

ツール/RoadLink /開始を選択します。


エクスポートコマンド

このコマンドを使用して，選択セット，データベース全体，現在の選択からのポイントをRoadLink へエクスポートします。

これを呼び出すには、

ツール/RoadLink /エクスポートを選択します。

エクスポートダイアログが表示されます。


エクスポートダイアログ

このダイアログを使用して，選択セット，データベース全体，現在の選択からのポイントをRoadLink へエクスポートします。RoadLink の既存のデータベースポイントの表示が道路定義の入力，確認時に役に立ちます。

これを呼び出すには：

ツール/RoadLink /エクスポートを選択します。

ポイント

ポイントのセットを選択します。

3つのオプションが使用できます。

現在の選択	選択されているポイントをエクスポートします。
データベース全体	すべてのデータベースポイントをエクスポートします。
選択セット	選択セットをリストから選択します。
詳しくはRoadLink のヘルプをご覧ください。


登録商標

地球儀と三角形のﾛｺﾞとTrimbleという文字､DTMLink、GPSurvey、RoadLink、Trimble Geomatics Office、Trimble Survey Controller､Trimble Survey Office､Trimble Total Control､TRIMMAP､TRIMNET､TSC1､TSCe はTrimble Navigation Limitedの登録商標です。

六文儀のﾛｺﾞとTrimbleという文字､Geodimeter､GPS Pathfinderは､US Patent and Trademark Officeに登録されたTrimble Navigation Limitedの登録商標です。

その他の登録商標の全所有権はそれぞれの所有者に帰属します。

標準ﾃﾝﾌﾟﾚｰﾄﾗｲﾌﾞﾗﾘ､ｩ1994 ﾋｭｰｲｯﾄ･ﾊﾟｯｶｰﾄﾞ社､標準ﾃﾝﾌﾟﾚｰﾄﾗｲﾌﾞﾗﾘ､ｩ1996,97 Silicon Graphics Computer Systems,Inc （ｼﾘｺﾝｸﾞﾗﾌｨｯｸｽ･ｺﾝﾋﾟｭｰﾀｰｼｽﾃﾑ社）､標準ﾃﾝﾌﾟﾚｰﾄﾗｲﾌﾞﾗﾘ､ｩ1997 Moscow Center for SPARC Technology （ﾓｽｸﾜSPARC技術ｾﾝﾀｰ）


プロジェクト圧縮&修復コマンド

このコマンドは，プロジェクトのデータベースの圧縮と修復に使用します。

このコマンドを呼び出すには、

ユーティリティ/プロジェクトの圧縮および修復を選択します。

プロジェクト圧縮&修復ダイアログが表示されます。


プロジェクト圧縮&修復ダイアログ

このダイアログは，プロジェクトのデータベースの圧縮と修復に使用します。

圧縮

データベースの圧縮はハードディスクの空き容量を増やし，ソフトウェアのパフォーマンスも向上しますので，プロジェクトのデータベースの圧縮は定期的に行うことが推奨されます。

修復

Trimble Geomatics Office を使用中に突然の停電があった時など，データベースが破損する場合があります。

データベースを編集中にTrimble Geomatics Office が予期せず終了してしまった場合は，終了直前に編集していたデータがデータベースの修復後に欠損している場合があります。修復後はプロジェクトを開きなおして，最後に編集していた箇所をチェックし，変更が保存されているかどうかを確認してください。

プロジェクト圧縮&修復ダイアログを使用するには：

1.	ユーティリティ/プロジェクト圧縮&修復を選択します。

2.	圧縮，または修復したいプロジェクトを選択します。

プロジェクトが圧縮，または修復不可能なものの場合，エラーメッセージが表示されます。

ヒント：ハードディスクのフラグメントの状態が良くない場合は，データベースの圧縮の前にデフラグをしてください。


Trimble Geomatics Officeユーティリティ

下記のTrimble Geomatics Office ・ユーティリティは，Trimble Geomatics Office をインストールする際に通常のインストールを選択することで使用できるようになります。

Trimble Coordinate System Manager�（座標系マネージャ）ユーティリティ

Trimble Convert to RINEX�（RINEXへ変換）ユーティリティ

Trimble Data Transfer （データ転送）ユーティリティ

Trimble DC File Editor�（DCファイルエディタ）ユーティリティ

Trimble Feature and Attribute Editor�（特徴・属性エディタ）ユーティリティ

Trimble Line Type Editor�（ラインタイプエディタ）ユーティリティ

プラニングユーティリティ

Trimble Symbol Editor�（記号エディタ）ユーティリティ

Trimble A1 Viewer （A1ビューア）ユーティリティ

ノート：Trimble Grid Factory�（グリッドファクトリー）ユーティリティは，カスタムインストール・オプションを選択すると使用できるようになります。

詳細に関しては，Trimble Geomatics Office ユーザーガイドを参照してください。

ユーティリティの追加

ユーティリティ メニューに追加ユーティリティを加えるには､

1.	Microsoft Windows エクスプローラを使用して...\Program Files\Trimble\Trimble Geomatics Office\ユーティリティを開いてください。

2.	エクスプローラ・ウィンドウの右側の，空白の部分を右クリックしてください。

3.	新規/ショートカットオプションを選択します。

これで，ショートカット作成ウィザードが開きます。

4.	ショートカットを設定するには，ユーティリティメニューに追加したいユーティリティへのパスを入力してください。

5.	次へをクリックして，ユーティリティメニューに表示する追加ユーティリティの名前を定義するショートカットの名前を選択フィールドを終了します。

Trimble Geomatics Office を再起動すると，ユーティリティメニューに追加したショートカットのユーティリティが表示されます。


Symbol Editor （記号エディタ）

Trimble Symbol Editor™ユーティリティは，Trimble Geomatics Office で使用されるポイント記号ライブラリ(*.sym)の編集を可能にします。

このユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/Symbol Editor  を選択します。.

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

新規のポイントの記号を作成，もしくは既存のものを変更するには，このユーティリティを使用してください。編集したファイルをシステムファイルとして登録すると，作成した記号はTrimble Geomatics Office ，もしくはTrimble Feature and Attribute Editor（特徴・属性エディタ）ユーティリティでポイントスタイルを追加・変更する時に使用できるようになります。

ポイントスタイル

これはTrimble Geomatics Office でどのようにポイントが描かれるかを説明しています。

これはSymbol Editorユーティリティで作成された記号を含みます。

Symbol Editorユーティリティで作成された記号は，Trimble Geomatics Office ソフトエウェア上で自動的にポイントスタイルとして使用が可能になるわけではありません。ポイントはポイントスタイルを割り当てられるだけで，記号を割り当てられるわけではありません。ポイントスタイルは，新規に作成された記号を使用して定義されなければなりません。

Symbol Editorは，自動的にTrimble Geomatics Office によって現在使用されている記号・ライブラリと一緒に開きます。開かれたライブラリの中にある記号の名前が，一覧として画面に表示されます。この一覧の中から，編集したい記号を選択してください。

Trimble Geomatics Office を起動していない時でも，エディタを単独で使用することもできます。単独で使用したい場合は，Trimble Geomatics Office のフォルダから，Symbol Editorユーティリティのショートカット・アイコンを選択してください。

ノート：Trimble Geomatics Office から独立してエディタを使用した場合，記号タイプに対する変更は，現在開いているプロジェクトには適用されません。変更を適用するには，プロジェクトを一度閉じて，再度開いてください。これで，保存された変更点が記号・ライブラリで使用できるようになります。

詳細に関しては，Trimble Symbol Editorユーティリティのヘルプを参照してください。


Line Type Editor （ラインタイプエディタ）

Trimble Line Type Editor ™ユーティリティは，Trimble Geomatics Office で使用されるラインタイプライブラリ(*.ltp)の編集を可能にします。

このユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/Line Type Editor  を選択します。

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

新規のポラインタイプを作成，もしくは既存のものを変更するには，このユーティリティを使用してください。編集したファイルをシステムファイルとして登録すると，作成したラインタイプはTrimble Geomatics Office もしくはTrimble Feature and Attribute Editor（特徴・属性エディタ）ユーティリティでラインスタイルを追加・変更する時に使用できるようになります。

ラインスタイル

これはTrimble Geomatics Office でどうやってラインが描かれるかを説明しています。

これはLine Type Editorユーティリティで作成されたラインを含みます。

Line Type Editorユーティリティで作成されたラインタイプは，Trimble Geomatics Office ソフトエウェア上で自動的にラインタイプとして使用が可能になるわけではありません。ラインはラインスタイルを割り当てられます。ラインスタイルは，新規に作成されたラインタイプを使用して定義されなければなりません。

Line Type Editorユーティリティは，自動的にTrimble Geomatics Office によって現在使用されている記号・ライブラリと一緒に開きます。開かれたライブラリの中にあるラインタイプの名前が，一覧として画面に表示されます。ラインタイプを編集するには，この一覧を使用してください。

Trimble Geomatics Office を起動していない時でも，エディタを単独で使用することもできます。単独で使用したい場合は，Trimble Geomatics Office のフォルダから，Line Type Editorユーティリティのショートカット・アイコンを選択してください。

ノート：Trimble Geomatics Office から独立してエディタを使用した場合，システム・ラインタイプ・ライブラリに対する変更は，現在開いているプロジェクトには適用されません。変更を適用するには，ラインタイプ・ライブラリへの変更を保存した後，プロジェクトを閉じて再度開いてください。これで，保存された変更点がラインタイプ・ライブラリで使用できるようになります。

詳細に関しては，Trimble Line Type Editorユーティリティのヘルプを参照してください。


Grid Factory　（グリッドファクトリー）

Trimble Grid Factory™ユーティリティをインストールするには，カスタム・インストールのオプションを選択してください。

インストール後にこのユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/Grid Factory  を選択します。.

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

Trimble Grid Factoryユーティリティは，測地グリッドファイル(*.dgf)とジオイドグリッド(*.ggf)を処理するのに使用します。

既存のグリッドからサブグリッドを作成したり，複数のグリッドをまとめて一つのグリッドにしたい時は，このユーティリティを使用します。測地グリッドファイルやジオイドモデル・グリッドファイルは，Trimble Geomatics Office を使用してサブグリッドすることができます。

Grid Factoryユーティリティを使用してジオイドグリッド・ファイルを作成する場合は，新規ファイルに入力する名前がTrimble Coordinate System Manager�ユーティリティで作成したジオイドモデルの名前と同じであることを確認してください。

カバーする地理的範囲が広い場合，グリッドも大きくなることに注意してください。。

例えば，OSU91ジオイドグリッドは，おおよそ2Mbのサイズになります。データロガーと受信機には，通常はこれほど大きなデータを処理するメモリがありません。OSU91グリッドは，全地球をカバーしますが，ほとんどの調査ではこれほどのカバー域は必要とされません。一般的な調査に必要とされるのは数十から数百平方キロの範囲で，このような小さな範囲をカバーするグリッドは，数百バイトほどのサイズです。

Grid Factoryユーティリティを使用することによって，ローカルエリアをカバーするジオイドモデル・サブグリッドファイルを作成することができます。これらのファイルは，Trimble Survey Controllerソフトウェア(バージョン6もしくはそれ以降)装置にアップロードできる程度に小さく，ローカルエリア用に使用されます。

多くのTrimble製品は，Grid Factoryユーティリティで使用できる，測地系変換用グリッドファイルとジオイドモデリングが付属しています。Grid Factoryユーティリティは，他のフォーマットのグリッドファイルをインポートして，Trimbleグリッド・フォーマットに変換することもできます。

詳細に関しては，Trimble Grid Factoryユーティリティのヘルプを参照してください。


DC File Editor （DCファイルエディタ）

Trimble DC File Editor™ユーティリティは，Survey Controller (*.dc)ファイルの編集を可能にします。

このユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/DC File Editor  を選択します。.

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

ノート：Trimbleでは，全ての編集をTrimble Geomatics Office で行うことを推奨しています。Trimble Geomatics Office で全ての編集作業を行っていれば，作業中に問題が起きた場合でも常にオリジナルの装置ファイルに戻ることができるからです。

TrimbleのDC File Editorユーティリティは，次にタイプの装置からのファイルを編集することができます。

Trimble

Sokkia SDR (バージョン4-03まで)

SDRフォーマットに変換可能な装置ファイルすべて

.dcファイルの内容を編集するには，Trimble DC File Editorユーティリティを使用してください。例えば，現場で収集された不確かなデータを変更したり，現場では得られなかった情報を追加することなどができます。

ノート：属性の編集をしたり，特徴・属性ライブラリの情報を変更することはできません。

詳細に関しては，Trimble DC File Editorユーティリティのヘルプを参照してください。


Feature and Attribute Editor (特徴・属性エディタ)

Trimble Feature and Attribute Editor�ユーティリティは，特徴コード処理とGIS属性データ収集のための特徴・属性ライブラリ(*.fcl)の管理に使用します。

このユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/Feature and Attribute Editor  を選択します。

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

Trimble Feature and Attribute Editorユーティリティを使用して，特徴・属性ライブラリ・ファイルを表示または編集します。特徴・属性ライブラリは，次の用途に使用されます。

特徴コード処理

属性収集

.fclは，特徴，CADスタイル，そしてコントロールコードの定義を含むテキストファイルです。特徴の定義には，以下を含むことができます。

特徴用のコード

特徴づけられたポイントで実行される，CAD手順

特徴用に必要とされる属性

特徴・属性ライブラリは，新規に作成することができます。Trimble Geomatics Office には標準の特徴・属性ライブラリが付属しており，これを使用，または個別の必要性に応じて変更を加えて使用することもできるようになっています。

詳細に関しては，Trimble Feature and Attribute Editorユーティリティのヘルプを参照してください。


Coordinate System Manager （座標系マネージャ）

座標系データベース(Current.csd)にアクセスするには，Trimble Coordinate System Manager™ユーティリティを使用します。

このユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/Coordinate System Manager  を選択します。.

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

Trimble Coordinate System Manager ユーティリティによって，次のものを新規に定義することができます。

楕円パラメータ

測地系変換

座標系

サイト定義

ジオイドモデル

ノート：Trimble は広範にわたる座標系定義をすでに用意しており，ほとんどのユーザはTrimble Coordinate System Manager ユーティリティを使用する必要はありません。この既存の定義に独自に座標系定義を追加したい時にのみ，Trimble Coordinate System Manager ユーティリティを使用してください。

Trimble Geomatics Office は，この座標系データベースを使用して，それぞれのプロジェクトにどの座標系，ジオイドモデル，サイトが使用できるかを判断します。

ノート：サイト作成および測地データベースへの保存は，Trimble Geomatics Office ，もしくはCoordinate System Manager ユーティリティを使用して行います。

詳細に関しては，Trimble Coordinate System Manager ユーティリティのヘルプ，もしくはTrimble Geomatics Officeユーザーガイドを参照してください。


Planning (計画)
プラニング

プラニングユーティリティは，GPSフィールド・セッションの計画とスケジュールの作成を補助します。GPSセッションを計画する前に，このユーティリティを使用してGPS測量に適した条件を定義してください。

を呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/プラニングを選択します。

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

測量プロジェクト管理の最初のステップは，通常はミッション・プランの作成から始まります。これは，プロジェクトに関する全ての重要な要素を定義することにより，予想できる全ての状況下において，プロジェクトを効果的かつ効率良く処理できるようにするためです。リアルタイムキネマティック（RTK）測量を行っている場合は：

Planningユーティリティを使用して，既知点初期化を行うために必要な最低4衛星，またOn-The-Fly (OTF )初期化を行うために5衛星を確保できることを確認してください。

位置精度劣化(PDOP：Position Dilution of Precision )の値をチェックし，衛星の幾何学的条件が，正確なリアルタイム測位に適しているかどうかを確認してください。

ノート：プラニングユーティリティはTrimble Geomatics Office プロジェクトとの直接的な関係はなく，セッションの詳細の保存は行いません。プログラムの実行中にセッションを定義して，それをそのプログラム内で使用することはできます。

プラニングは，以下の実行を補助します。

テーブルとグラフィック画面による，衛星の使用状況の視覚的表示と予測

衛星の選択，衛星暦，タイムゾーン，現場の視界遮蔽物，仰角マスクのテスト

現場作業員が作業に必要なPDOPおよび時間が決められているセッションに対して，最適な観測時間帯の選定

詳細に関しては，プラニングユーティリティ内のヘルプを参照してください。


Convert to RINEX （RINEXへ変換）

Receiver INdependent EXchange (RINEX)フォーマットは，受信機によって収集されたGPSデータのASCII表現です。Convert to RINEXユーティリティは，Trimble測量受信機を使用して収集されたバイナリの.datフォーマットのファイルを，ASCII RINEXフォーマットのファイルへ変換するユーティリティです。Trimble Geomatics Office を起動していない時でも，このユーティリティを単独で使用することができます。

Convert to RINEXユーティリティを呼び出すには，次の1つを行ないます。

プロジェクトが開かれていない状態でユーティリティ/Convert to RINEX  を選択します。

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

このユーティリティを使用して，以下の作業を行います。

変換するファイルの選択

変換パラメータの設定

アンテナおよびヘッダに関する出力ファイル情報の設定

選択したファイルの，RINEXフォーマットへの変換

Convert to RINEXユーティリティは，次の3タイプのRINEXファイルを作成することができます。

観測(ステーション・アンテナ情報を伴った，生のGPS観測)

航法(GPS軌道)

気象(気圧，気温および関連湿度)

ユーティリティは，RINEX観測および航法ファイルだけを作成するよう初期設定されていますが，RINEX気象ファイルも作成するよう選択できます。

詳細に関しては，Trimble Convert to RINEXユーティリティのヘルプを参照してください。


A1 Viewer （A1 ビューア）

A1 Viewer ユーティリティは，GPSurvey のプロジェクトバックアップファイル(*.A1)を表示し，そこから選択したファイルを希望のディレクトリに送り出す(保存する)ことを可能にします。A1 Viewer はGPSurveyから独立して作業が可能なユーティリティなので，お持ちのコンピュータにこのソフトウェアをインストールする必要がありません。GPSurvey プロジェクトのデータファイルを保存した後は，Trimble Geomatics Office のインポート機能を使用して，データを現在使用しているプロジェクトにインポートすることができます。

A1 Viewer ユーティリティを呼び出すには，次の1つを行ないます。

何もプロジェクトを開いていない場合は，ユーティリティ/A1 Viewer を選択します。

Microsoft Windows のスタートメニューからいつでもそれを選択できます。

GPSurvey座標インポート

GPSurvey座標インポート・オプション(GPSurvey座標[curr_net.dat])は，Curr_net.dat ファイルから網平均された座標をインポートします。このソフトウェアを呼び出すには：

1.	ファイル/インポートを選択します。するとインポートダイアログが表示されます。

2.	測量タブからGPSurvey座標(Curr_net.dat)を選択し，OKをクリックします。これで，開くダイアログが表示されます。

ノート：インポートされるファイルは，curr_net.dat の名前を持っていなければなりません。

3.	インポートしたいファイルを探し，OKをクリックします。

この手順で，Curr_net.dat ファイルから網平均された座標をインポートすることができます。

A1 Viewer ユーティリティでサポートされているファイル

A1 Viewer で開けるファイルは，GPSurvey でバックアップされたファイルのみです。

.ssf/.sskファイル�これらのファイルには，GPSurvey WAVEプロセッサからの基線解析の結果があります。これらはインポートダイアログの測量タブにあるSSF/SSKファイル(*.ssf,*.ssf)のインポートフォーマットを使用して，Trimble Geomatics Office プロジェクトにインポートされます。

GPS データファイル�これらのファイルには，現場で収集された生のGPSデータが記載されています。フィルタを選択するときには，*.dat (Trimble受信機からの生のGPSデータ)と*.rnx (WAVEプロセッサで使用するために変換された生のRINEXデータファイル)の2つのタイプのファイルが選択できます。これらのファイル(.datと.mx)もまた，GPSデータ(*.dat)ファイルのインポートフォーマットを使用してプロジェクトにインポートすることができます。

ノート：GPSデータファイル・インポートフォーマットのファイルを開くダイアログで使用できる*.rnx ファイルを表示するには，ファイルのタイプフィールドで全てのファイル(*.*)を選択してください。

網平均された座標ファイル�これらのファイル(Curr_net.dat およびCoords.log )には，GPSurvey プロジェクトからの網平均された座標があります。Curr_net.dat ファイルは，座標をTrimble Geomatics Office にインポートするのに使用され，Coords.log ファイルはASCIIフォーマットになっていて，テキスト・エディタでのみ開くことができます。インポートするGPSurveyプロジェクトのポイントは，地理的座標とグリッド座標のどちらのフォーマットでも良く，またどのような座標系でもかまいません。しかし，座標のインポートが正しく行われるには，Trimble Geomatics Officeプロジェクトの座標系プロパティが，GPSurveyプロジェクトの座標系プロパティと完全に一致していなければなりません。

ファイル(Curr_net.dat)はGPSurvey座標(Curr_net.dat)インポートフォーマットを使用してプロジェクトにインポートされ，ファイル(Curr_net.dat)が読み込まれる時には，GPSurvey網平均の際にどの座標が固定されたかを判別します。同じタイプの全ての座標要素がインポートされる前に，ファイル内で少なくとも1つの座標要素(NE,e,h)が固定されていなければなりません。例えば，標高がインポートされる前には，固定された標高が1つは必要になります。全てのインポートされる要素は，コントロールの質を与えられます。

.ggfファイル�これらのファイルは，GPSurveyプロジェクトで作成されたか，もしくはインポートされたローカル・ジオイドグリッド・ファイル(*.ggf)のジオイドデータが記載されています。これらはTRIMNet PlusソフトウェアのGeoid Modeling機能を使用して作成されたファイルで，このフィルターはGPSurveyで使用できたグローバル.ggfファイル(WW15MGH,GEOID99)は表示できません。この.ggfファイルをTrimble Geomatic Officeソフトウェアで使用するには，この.ggfファイルをプログラムファイル\Trimble\GeoDataフォルダに保存して，それからCoordinate System Managerユーティリティを使用してこの座標系データベースにジオイドを追加するようにしてください。このユーティリティの使用法に関する詳細は，Coordinate System Manager のヘルプを参照してください。

TRIMNet Plus のOne-Height Modeを使用する

TRIMNet PlusソフトウェアのOne-Height Modeを使用しているプロジェクトからGPSurvey座標をインポートする場合，Trimble Geomatics Officeプロジェクトの高度フィールドには，標高値が記載されてしまいます。これは，TRIMNet Plus ではOne-Height Mode調整をする際，標高(海抜)に楕円高度を使用するからです。GPSurveyプロジェクトにとのモードが使用されたか判らない場合は，プロジェクトをGPSurveyで開き，TRIMNet Plus の特別コントロール設定を調べてください。

精密軌道暦情報を使用する

GPSurveyプロジェクトのバックアップ機能は，WAVEソフトウェアで基線解析中に使用された精密軌道暦情報の圧縮はできません。GPSurvey プロジェクトのベースライン処理中に精密軌道暦情報が使用された場合，Trimble Geomatics Office へのインポートは，オリジナルのファイルからされなければなりません。


NGSアンテナモデル

Trimble Geomatics Office では，Trimble またはNGS の2つのアンテナタイプを使用できます。どちらのアンテナモデルを使用するかは，測量の必要性に応じて決定されます。しかし，Antenna.iniに定義されているものとは異なるアンテナタイプを使用する場合は，一般的にNGSアンテナモデル・セットを使用します。

Trimble アンテナセットが標準としてインストールされています。NGS アンテナモデルをインストールするには、GPS 基線処理スタイルダイアログの全般タブでアンテナモデルリストからNGS オプションを選択します。


　測量表示コマンド

このコマンドを使用して，測量画面にプロジェクトを表示します。

これを呼び出すには，下の1つを行います｡

表示/測量を選択する。

測量表示ツールを選択する。


　測量表示－概要

関連項目

プロジェクトを測量画面，または平面図画面に表示できます。

測量画面を使用して，下のような測量に関係する操作を行います｡

GPS 観測と一般測量機観測をチェックする。

誤差のあるデータを修正する。

いくつかのメニューオプション，ツールバーは測量画面でのみ，使用できます。それにより基線解析，網平均のような測量に関係する操作を行えます。

ヒント：同時にプロジェクトの他の部分を表示するには，複数のウィンドウを作成します。詳しくは新しいウィンドウコマンドをご覧ください。

測量データを表示する

GPS 観測，一般測量機観測はラインとして測量画面に表示されます。

観測のラインをダブルクリックして観測をプロパティウィンドウを使用して表示し，必要であれば観測を編集します。許容範囲外の閉合較差があったり，GPS 観測が却下判定基準に不合格だったりすると，エラーフラグがポイント上，または観測上に表示されます。

違うラインの色は表示/オプション/画面デザインタブのスタイル設定に基づき異なるステータスを表わします。基準点と網平均されたポイントはまた，測量画面に特別な表示をします。

測量  画面で可能な操作

下の操作は測量画面でのみ，使用できます｡

表示フィルター

観測選択

GPS 環閉合レポートオプション

基線解析モジュールと網平均モジュールをインストールしている場合，他にも使用できる測量に関係する操作があります。下の表は，各モジュールから使用できる追加操作を表示します。

基線解析モジュール

網平均モジュール

表示を変更する

いつでも，表示を変更できます。

平面図画面に変更するには，下の1つを行います｡

平面図表示ツールを選択する。

表示/平面図を選択する。


　　平面図表示コマンド

このコマンドを使用して，平面図画面にプロジェクトを表示します。

この画面を呼び出すには，下の1つを行います｡

表示/平面図を選択する。

平面図表示ツールを選択する。


平面図表示－概要

関連項目

プロジェクトを平面図画面，または測量画面に表示できます。

平面図画面を使用して，現場の測量中に観測した地形図の特徴を表示します。

ポイント，ライン，スタイル，注釈を追加して，プロジェクトの外観を良くすることができます。平面図に行われた変更は，測量観測には影響しません。

いくつかのメニューオプション，ツールバーは平面図画面でのみ，使用できます。それによりCAD関係の(特徴コード処理，レイヤー制御，スタイル管理のような)操作を行えます。

ヒント：同時にプロジェクトの他の部分を表示するには，複数のウィンドウを作成します。詳しくは新しいウィンドウコマンドをご覧ください。

エンティティ(ポイント，ライン，曲線，円弧，テキスト，注釈)はそれらに与えられたスタイルに従って表示されます。エンティティのスタイルは，特徴コード処理やプロパティウィンドウを使用して変更できます。GPS 観測，および一般測量機観測は表示されません。平面図画面でラインを追加する場合，新しいエンティティをデータベースに追加しています。

測量画面に変更すると，CAD ラインは表示されません。

いったん，平面図画面で操作を完了したら，平面図を印刷したり，設計ソフトウェアパッケージにエクスポートしたりできます。

平面図  画面で可能な操作

下の操作は平面図画面でのみ，使用できます｡

レイヤー

スタイル(ポイント，ライン，テキスト)

ポイント挿入

ライン等挿入

テキスト挿入

注釈挿入

現在の観測にライン等挿入

レイヤーで選択

スタイルで選択

タイプで選択

ポイントの特徴で選択

特徴コード処理

DTMLink

RoadLink

表示を変更する

いつでも，表示を変更できます。

測量画面に変更するには，下の1つを行います｡

測量表示ツールを選択する。

表示/測量を選択する。

Alt+1 を押す。


拡大コマンド

このコマンドを使用して，グラフィックウィンドウの一部を大きくします。

これを呼び出すには，下の1つを行います｡

表示/ズーム/拡大を選択する。

拡大ツール [image] を選択する。

ズームナビゲータを表示している場合，グラフィックウィンドウで表示しているエリアは，ズームナビゲータウィンドウに黒い四角で表示されます。

拡大ツールを使用するには､

1.	ポインタをグラフィックウィンドウの上に移動します。

中にプラス記号のある虫眼鏡のポインタが表示されます。虫眼鏡ポインタの上の十字がホットスポットをマークします。

2.	下の1つを行います｡

グラフィックウィンドウの任意の位置をクリックして2倍に拡大します。ホットスポットが中心になります。

グラフィックウィンドウでポインタをドラッグし，拡大したいエリアを囲む四角を形成します。エリアが小さいほど，縮尺は大きく変わります。マウスのボタンを離すと，四角で囲まれたエリアの内容はグラフィックウィンドウ全体に表示されます。行っている拡大操作を取り消すには，マウスのボタンを押している間にEscを押します。

ホイールつきのマウスの場合，ホイールを使用して拡大，縮小ができます。ホイールでパンするには，ホイールを下げたままマウスをドラッグします。グラフィックウィンドウの内容はマウスの動きに合わせて移動します。


縮小コマンド

このツールを使用して，グラフィックウィンドウに表示されるエリアを小さくします。

これを呼び出すには，下の1つを行います｡

表示/ズーム/縮小を選択する。

縮小ツール [image] を選択する。

ズームナビゲータが表示されている場合，グラフィックウィンドウで表示しているエリアは，ズームナビゲータウィンドウに黒い四角で表示されます。プロジェクトの全体以上に縮小している場合，ズームナビゲータに黒い四角は表示されません。

縮小ツールを使用するには､

1.	ポインタをグラフィックウィンドウの上に移動します。

中にマイナス記号のある虫眼鏡のポインタが表示されます。虫眼鏡ポインタの上の十字がホットスポットをマークします。

2.	下の1つを行います｡

グラフィックウィンドウの任意の位置をクリックします。グラフィックウィンドウの縮尺が変更され，ホットスポットの位置が中心になります。

グラフィックウィンドウでポインタをドラッグし，表示したいエリアを囲む四角を形成し，マウスのボタンを離します。グラフィックウィンドウの縮尺が変わり，前にグラフィックウィンドウに表示されていた情報は選択された四角いエリアに表示されます。四角が小さいほど，縮尺は大きく変わります。行っている縮小操作を取り消すには，マウスのボタンを押している間にEscを押します。

ホイールつきのマウスの場合，ホイールを使用して拡大，縮小ができます。ホイールでパンするには，ホイールを下げたままマウスをドラッグします。グラフィックウィンドウの内容はマウスの動きに合わせて移動します。


全体表示コマンド

このコマンドを使用して，現在のプロジェクトのすべての可視ポイントを表示します。全体表示コマンドを選択すると，グラフィックウィンドウは自動的にすべてのデータが見えるように調整されます。

これを行うには，下の1つを行います｡

表示/ズーム/全体を選択する。

Ctrl+E を押す。

全体表示ツール [image] を選択する。

ポインタをグラフィックウィンドウに置く。右クリックし，ショートカットメニューから全体表示を選択する。


前の大きさコマンド

このコマンドを使用して，プロジェクトに入ってからの以前の表示の大きさに1つずつ戻ります。

これを行うには，下の1つを行います｡

表示/ズーム/前の大きさを選択する。

前の大きさツール [image] を選択する。

ズームナビゲータが表示されている場合，グラフィックウィンドウで表示しているエリアは，ズームナビゲータウィンドウに黒い四角で表示されます。プロジェクトの全体以上に縮小している場合，ズームナビゲータに黒い四角は表示されません。

2つ以上のグラフィックウィンドウを開いている場合，ウィンドウごとに別々にズームスタックが保存されます。


パンコマンド

このコマンドを使用して，ズームしているエリアの中心を移動し，画面の他のエリアを表示します。

これを行うには，下の1つを行います｡

表示/パンを選択する。

パンツール [image] を選択する。

手のひらポインタが表示されます。

ズームナビゲータが表示されている場合，グラフィックウィンドウで表示しているエリアは，ズームナビゲータウィンドウに黒い四角で表示されます。プロジェクトの全体以上に縮小している場合，ズームナビゲータに黒い四角は表示されません。

パンはズームとして記憶されません。従って，前のズームを行ってパンより前の元の画面には戻れません。

パンツールを使用するには､

1.	ポインタをグラフィックウィンドウの上に移動します。

ポインタの上の十字がホットスポットをマークします。

2.	パンしたいところへポインタをドラッグします。グラフィックウィンドウの内容はマウスの動きに合わせて移動します。

ホイールつきのマウスの場合，ホイールを使用して拡大，縮小ができます。ホイールでパンするには，ホイールを下げたままマウスをドラッグします。グラフィックウィンドウの内容はマウスの動きに合わせて移動します。


選択へパンコマンド

このコマンドを使用して，グラフィックウィンドウの特定の位置へパンし，縮尺します。

選択へパンダイアログが表示されます。


選択へパンダイアログ

このダイアログを使用して，グラフィックウィンドウの特定の位置へパンし，縮尺します。

このダイアログを呼び出すには，表示/選択へパンを選択します。

表示の中心

これらのフィールドは，表示の中心の名前や位置を指定するなどして埋めることができます。

ポイント名	このフィールドを使用して，データベースのポイントの名前を指定します。このフィールドでグラフィック画面の適当なポイントをクリックすると，ポイント名，北距，東距が埋められます。
北距/東距	これらのフィールドを使用して表示の中心の位置を決めます。このフィールドでグラフィック画面の適当なポイントをクリックすると，北距と東距が埋められます。
表示半径

表示半径フィールドは表示の範囲を設定します。単位を指定しなかった場合，プロジェクトプロパティダイアログの単位とフォーマットタブの距離の単位の設定が使用されます。


フィルターコマンド

このコマンドを使用して表示フィルターダイアログを開きます。

これを呼び出すには，下の1つを行います｡

表示/フィルターを選択する。

表示フィルターツール [image] を選択する。

ステータスバーの表示フィルターアイコン [image] をクリックする。


表示フィルターダイアログ

このダイアログを使用して，測量画面で作業中に表示したくない観測をフィルターから落とします。

ノート：表示フィルターで隠されたデータは，選択メニューのどのコマンドを使用しても選択できません。

このダイアログを呼び出すには，下の1つを行います｡

表示/フィルターを選択する。

表示フィルターツールを選択する。

Ctrl+F を押す。

観測

このグループを使用して，表示したい観測グループを選択します。これは，いくつかの観測タイプのあるプロジェクトである場合に便利です。例えば，RTK と一般測量機があり，RTK 観測だけを表示したい場合などです。

すべての観測表示

このオプションを選択して，プロジェクトのすべての観測を表示します。このオプションは，網平均モジュールがインストールされている場合，表示されます。

網平均で使用マークのある観測のみ表示

このオプションを使用して，網平均で使用チェックボックスが選択されている観測のみ，表示します。(このチェックボックスは，プロパティウィンドウの概要ページにあります。)

このオプションは網平均モジュールがインストールされている場合に表示されます。このオプションを選択した場合，観測グループのいくつかのフィールドは使用できなくなります。

網平均を行える観測のみ表示

このオプションを選択して，網平均に使用できる観測のみ表示します。網平均で使用チェックボックスが選択されている必要はありません。(このチェックボックスは，プロパティウィンドウの概要ページにあります。)

例えば，無効にされた観測やチェックとして有効な観測も，それらを網平均で使用できる場合，選択できます。

考えられる(潜在的な)基線と一般測量機観測(網平均に使用できない)はフィルターから落とされます。

ノート：このオプションは網平均モジュールがインストールされている場合に表示されます。このオプションを選択した場合，観測グループのいくつかのフィールドは使用できなくなります。

表示する観測タイプ

表示する観測タイプグループには，下のチェックボックスがあります｡

RTK

後処理キネマティック

レーザー

デルタ標高

静止

一般測量機

補正

方位角

未解析基線

これらのチェックボックスを使用して，表示したい観測タイプを選択します。例えば，RTK ベクトルだけを表示するには，RTK チェックボックスを選択し，グループの他のチェックボックスはクリアします。

サイドショット(Sideshot )観測

連続

無効観測

チェック観測

これらのチェックボックスを使用して，選択された観測タイプからどの観測を表示したいか選択します。上のグループでどの観測を下のグループのフィルターで落としたいか指定してください。

例えば，RTK のチェック観測だけ表示するには，RTK  とチェック観測のチェックボックスを選択し，各グループの他のチェックボックスはクリアします。

ノート：観測に2つ以上の観測プロパティがある場合，表示する観測タイプに関係するすべてのチェックボックスを選択してください。

基線のないポイント表示

このチェックボックスを選択して，そのポイントから/へ伸びる観測のないポイントを表示します。例えば，キー入力ポイント。

イベント表示

このチェックボックスを選択してイベントを表示します。

選択セットのデータのみ表示

このチェックボックスを選択して，前に選択セットとして保存したデータを表示します。選択セットはリストから選択します。

Timeline を使用して独立したGPS 基線を表示

このチェックボックスが選択されているとき，Timeline に表示されている観測だけがグラフィックウィンドウに表示されます。

このツールを使用して，網平均の独立した基線を選択できます。

ツールバーの独立した基線表示ボタンを使用して，このオプションをオン/オフします。

ノート：このオプションは，後処理されたGPS データにのみ，適用されます。グラフィックウィンドウに表示されるすべてのほかのデータには適切な表示フィルターが適用されています。

ノート：このオプションは基線解析モジュールがインストールされている場合のみ，使用できます。

時間

このチェックボックスを選択して，指定された日時の範囲のGPS 観測のみ表示します。開始，終了フィールドが使用可能になります。

開始 / 終了

Timeline  の時間ルーラーから時間を選択してフィールドを埋めたり，キーボードから表示されるGPS 観測の日時の範囲を入力します。ユリアス日(通年日)を入力することもできます。


ポイントラベルー概要
ポイントラベル　‐　概要

詳細情報

利用方法	関連項目
概要

データベースに情報を保存しないでグラフィックウィンドウでエンティティについての情報を表示するには，ラベルを使用します。ラベルは測量，平面図両方の画面で使用できます。

作業セッション間でプロジェクトを再度開いた時，ラベル設定は復元されます。プロジェクトデータベースにエンティティの情報を保存するには，注釈を使用します。平面図画面でのみ，注釈を追加できます。

フィールドとユーザ定義可能なテキストの組み合わせでポイントにラベルをつけられます。カスタムラベルオプションを追加するには，テキストエディタを使用してOptions.iniファイルを編集します。ラベルは，常にラベルがつけられたポイントの右に表示されます。

ラベルはMicrosoft Windowsの画面設定のヒントと同じフォントとサイズを使用します。


プロジェクトバーコマンド

このコマンドを使用して，プロジェクトバーを表示したり隠したりします。

これを呼び出すには，下の1つを行います｡

表示/プロジェクトバーを選択する。

プロジェクトバーツール [image] を選択する。


再表示コマンド

このコマンドを使用して，画面を再表示ます。

これを行うには，下の1つを行います｡

表示/再表示を選択する。

F5 を押す。

グラフィックウィンドウが上書きされて見にくくなったとき，このコマンドを使用して，平面図を再表示します。


表示オプションダイアログ

このダイアログを使用してデータの表示をカスタマイズします。これを呼び出すには，表示/オプションを選択します。

表示オプションダイアログには下のタブがあります｡

グリッドライン

画面デザイン

測量データ

誤差楕円コントロール

背景地図


ポイントラベルダイアログ

このダイアログを使用してプロジェクトのポイントラベルを表示します。

メインメニューからこれにアクセスするには､表示/ポイントラベルを選択します。

ポイントラベル

ポイントにつけたいラベルのフィールドを選択します。下のオプションがTrimble Geomatics Office に用意されています。Options.iniファイルを使用して追加したカスタムラベルオプションは，このリストに表示されます｡

名前

特徴コード

標高

グリッド縮尺係数

標高縮尺係数

合成した縮尺係数

真北方向角角度

水平の質

標高の質

高度の質

適用先

2つのオプションがラベルポイントに使用できます｡

選択�これを選択して選択されたポイントにラベルをつけます。

データベース全体�このオプションを選択してすべてのポイントにラベルをつけます。北距が測量画面で選択されると，このオプションは標準で選択されます。

選択にラベルをつけると，Trimble Geomatics Office は自動的にラベルがつけられたポイントの名前を付けられた選択セットを作成します。

ノート：1度にラベルをつけられる選択は1つだけです。ラベルがつけられたポイントの選択があり，新しい選択にラベルをつけた場合，最初の選択のラベルは外されます。

クリア

クリアをクリックして現在のラベルをすべて削除します。

ノート：ポイントラベルつきでプロジェクトを再度開いた場合，ラベル設定は復元されます。

ヒント：テキストのフォントとサイズを変更するには，Microsoft Windows の画面設定のヒントの設定を使用します。


表示オプションダイアログ－グリッドラインタブ

このタブを使用して，グラフィックウィンドウにグリッドラインを表示します。

これを呼び出すには､

1.	表示/オプションを選択します。表示オプションダイアログが表示されます。

2.	グリッドラインタブを選択します。

グリッドライン表示

このチェックボックスを選択して，グラフィックウィンドウにグリッドラインを表示します。グリッドラインが表示されると，ステータスバーにグリッド間隔が表示されます。

ノート：ツールバーのグリッドライン [image] ボタンを選択してグリッドラインを表示することもできます。

下の項目が使用可能になります｡

固定グリッドライン数

このオプションを使用して画面に表示されるグリッドライン数を設定します。拡大，縮小すると，同じ数のグリッドラインが表示されます。

ノート：固定グリッドライン数は画面の短い方の辺に表示されます。

グリッド間隔

このオプションを使用して，グリッドの間隔を指定します。距離の単位はプロジェクトに指定されている単位です。

ノート：グリッドラインが多すぎて画面にきれいに表示できない場合，グリッドラインは表示されません。

グリッドラインタイプ

このオプションを使用して，グリッドラインのスタイルを選択します。

グリッドライン色

このオプションを使用して，グリッドラインの色を選択します。グラフィックウィンドウの背景の色に対してよく見えるように，グリッドラインの色を変更する必要があるかもしれません。

グリッドラインラベル

このチェックボックスを選択して，グリッドラインに北距，東距の値のラベルをつけます。

ノート：印刷/印刷コマンドを選択すると，グリッドラインは印刷されます。


表示オプション ダイアログ － 画面デザイン タブ

このタブを使用して，Trimble Geomatics Office グラフィックウィンドウにプロジェクトを表示するために使用される色を変更します。これにより，次が決まります｡

異なる観測タイプとポイントが測量画面にどのように表示されるか

グラフィックウィンドウの背景色

テキストの標準色

これを呼び出すには､

1.	表示/オプションを選択します。表示オプションダイアログが表示されます。

2.	画面デザインタブを選択します。

スタイル

このフィールドで，黒または標準を選択します。各オプションで決まる色の設定を下の表に示します｡


表示オプションダイアログ－測量データタブ

このタブを使用して，グラフィックウィンドウに測量データが表示される方法を変更します。

これを呼び出すには､

1.	表示/オプションを選択します。表示オプションダイアログが表示されます。

2.	測量データタブを選択します。

ノート：このタブは，測量画面の場合のみ，表示されます。

サイドショット(Sideshot )に短いラインを使用

このチェックボックスを選択してサイドショット(Sideshot )観測のベクトルを短いラインで表示します。

観測数を表示( 複数の場合 )

このチェックボックスを選択して，複数回観測されたライン上に観測回数を表示します。

観測がフィルターされている場合，観測回数は観測の総数への割合として表示されます。例えば，1/3。


表示オプションダイアログ －誤差楕円コントロ-ルタブ
表示オプションダイアログ－誤差楕円コントロールタブ

このタブを使用して，誤差楕円，高度誤差の矢印，標高誤差の矢印を網平均の後，グラフィックウィンドウに表示するかどうかを決定します。誤差楕円のスケールと目盛りのサイズも決定できます。

これを呼び出すには､

1.	表示/オプションを選択します。表示オプションダイアログが表示されます。

2.	誤差楕円コントロールタブを選択します。

ノート：このタブは，測量画面の場合のみ，表示されます。

ポイントの誤差楕円と方向表示

このチェックボックスを選択して，ポイントの誤差楕円と矢印を表示します。

標高誤差表示

このチェックボックスを選択して，標高誤差を表示します。

高度誤差表示

このチェックボックスを選択して，高度誤差を表示します。

誤差楕円スケール

下に示す誤差楕円のスケールスライダーは，網平均の後，グラフィックウィンドウに表示される誤差楕円の大きさをコントロールします。

楕円を小さくするには，スライダーを左に移動します。楕円を大きくするには，スライダーを右へ移動します。

目盛サイズ

このフィールドを使用して，下に示すグラフィックウィンドウの誤差楕円のバースケールに表示される目盛の幅を決定します。

目盛の間隔を変更して目盛サイズフィールドに表示される値に合わせるとき，サイズを大きくすると，バースケールは長くなります。


表示オプション ダイアログ － 背景地図 タブ

Trimble Geomatics Office はグラフィックウィンドウに背景ファイルを表示できます。Drawing Exchange Format (.dxf)，Windows Bitmap (.bmp)，Tagged Image File Format (.tif)等の背景ファイルをインポートして表示できます。Windows Bitmap (.bmp)，Tagged Image File Format (.tif)ファイルが正しく表示されるためには，georeference(測地的な規準を与える)されていなければなりません。

ESRI のワールドファイルフォーマットは，背景ファイルをgeoreference(測地的な規準を与える)するために使用されます。ワールドファイルは.tfw または.wld の拡張子のASCII テキストファイルです。Trimble Geomatics Office で使用するワールドファイルは下の条件を満たしている必要があります。それは､

同じ場所に関連する.dxf，.bmp，.tif ファイルが保存されている

Trimble Geomatics Office プロジェクトと同じ座標系

Trimble Geomatics Office プロジェクトと同じ単位

ノート：Trimble Geomatics Office は，圧縮されていないTIFF ファイルと，以下の圧縮スキーマをサポートします｡CCITT，PackBits，Thunder，Next，LogLuv。しかし，以下の圧縮ファイルはサポートしません：OJPEG，JPEG，ZIP，LZW，PixarLog。

ノート：Trimble Geomatics Office は，RLE 圧縮.bmp ファイルをサポートしません。

背景地図タブを使用して，表示する背景ファイルを選択します。

これを呼び出すには､

1.	表示/オプションを選択します。表示オプションダイアログが表示されます。

2.	背景地図タブを選択します。

ファイル名

このグループは背景地図として使用するよう選択されたファイルのリストを表示します。

追加

追加ボタンを使用して，背景ファイルを選択します。.dxf，.bmp，.tif ファイルを選択できます。

ノート：関連のワールドファイルが同じ場所に保存されていることを確認してください。このファイルをリストで選択する必要はありません。

除外

除外ボタンを使用して，背景ファイルをリストから外します。

ワールドファイルフォーマット

下はワールドファイルフォーマットの例です｡

20.17541308822119

0.00000000000000

0.00000000000000

�20.17541308822119

424178.11472601280548

4313415.90726399607956

これら6つの値は，下に示す式の6パラメータの擬似変換を使用したimage-to-world(イメージから測地)変換の計算に使用されます｡

x1 =Ax +By +C

y1 =Dx +Ey +F

ここで

x1 	地図上のピクセルに対する計算されたx-座標

y1 	地図上のピクセルに対する計算されたy-座標

x 	イメージ内の横のピクセル数

y 	イメージ内の縦のピクセル数

A 	x スケール；x方向の地図ユニットのピクセルの大きさ

B,D	回転の項

C,F	移動の項；左上のピクセルの中心のx，y 地図座標

E 	マイナスのy スケール；y方向の地図ユニットのピクセルの大きさ

変換パラメータはワールドファイルに下の順で保存されます｡

20.17541308822119 泡

0.00000000000000 縫

0.00000000000000 烹

-20.17541308822119 胞

424178.11472601280548 砲

4313415.90726399607956 芳

ノート：Trimble Geomatics Office は，イメージの回転をサポートしません。ワールドファイルに0以外の回転の項(D，B パラメータ)があっても使用されません。

ノート：x スケール(A)かy スケール(E)のサインは、座標系の向きによって決まります。これは、イメージの原点と地理的座標系が異なるためです。イメージの原点は常に左上の角にありますが、地理的座標系の原点は座標の方向によって変わります。

例えば､NE座標系に対しては､地図座標系の原点は左下の角に位置します。イメージの行の値は左上の角から下向きで増加しますが，地図のy 座標の値は左下の角から上向きに増加します。そのためにNE 座標系に対してy スケール(E)は負の値になります。次の表は､NEとSE､NW 座標系に対して使用すべきx とy スケールのサインをまとめています。

	NE	SW	NW
x (A)	+ve	-ve	-ve
y (E)	-ve	+ve	-ve


保証

ソフトウェアとファームウエアの有限保証

トリンブル社はこのトリンブル社のソフトウェア製品（以下､｢ソフトウェア｣）が､配達日から数えて90日間はそのソフトウェアに関してトリンブル社が発行した仕様書に実質上適合することを保証します。

保証是正手段

上記のように設定された保証期間中のトリンブル社の単独責任とあなたの唯一の是正手段は､トリンブル社の選択に従い､保証に適合しない製品やソフトウェア（以下､｢不適合製品｣）をトリンブル社に返還することによって行われる､不適合製品の修理か､不適合製品に対して支払われた購入価格の払い戻しです。

保証の除外

この保証は以下のような状況下か範囲内においてのみ適用します。(i)製品とソフトウェアは､トリンブル社の使用マニュアルと仕様書に従って､正しくインストール､配置､接続､保管､管理､操作が行われ､かつ(ii)製品とソフトウェアに対する改造や誤用は行われていない。　上記の保証が不適用であり､かつトリンブル社が責任を持たないのは､以下を基礎とする保証違反の主張です。(i)トリンブル社が施行または提供､特定したのでない製品や情報､システム､装置を､製品かソフトウェアと一緒に使用したか組み合わせたことによって起こった欠陥や性能に関する問題。(ii)その製品に対するトリンブル社の標準仕様書以外かそれに加えられた仕様書に従っての製品かソフトウェアの作業。(iii)許可なしでの製品かソフトウェアの改造か使用。(iv)落雷かその他の放電､淡水か塩水への投入かその噴霧。または(v)消耗部分（例､電池）の通常の消耗。

上記の保証は､製品とソフトウェアの性能に関するトリンブル社の完全な責任とあなたの唯一の是正方法を記述しています。この承認書で明白に提供されている場合を除いては､トリンブル社は製品とソフトウェアをそのままで保証なし（明白か言外）で供給し､特定の目的に対する適性や市販可能性の言外保証を明白に除外します。記述された明白な保証は､あらゆる製品やソフトウェアから､またはそれに関連して発生したトリンブル社側の責任や義務を代行します。州や司法権によっては言外保証の期間制限を許可しないので､上記の除外事項は適用しないこともあります。

有限責任

適用される法律が許す最大範囲内において､トリンブル社は､トリンブル社が可能性のある損害を通告したかどうかにかかわらず､あなたとトリンブル社の間で進展しているか､進展してきた一連の取引と関係なく､製品やソフトウェアに何らかの形で関係する､あらゆる状況下や合法的理論下でのあらゆる間接的､特別､結果的損失に対して責任を持ちません。州や司法権によっては結果的または付随的な損害に対する責任の制限や除外を許可しないので､上記の制限は適用しないかもしれません。

どのような場合においても､この承認書の不履行に対する､またはそれの下でのトリンブル社の単独責任とあなたの唯一の是正手段は､製品かソフトウェアに対して支払われた購入価格かライセンス料の払い戻しに制限されます。


歓迎
Trimble Geomatics Office�ヘルプへようこそ

このヘルプは､Trimble Geomatics Office の機能と能力とを効果的に使用するのに必要である情報を提供できるようにデザインされています。Trimble Geomatics Office のセットアップとご利用方法を説明します。

ヘルプのご利用方法

Trimble Geomatics Office �概要

Trimble社に関して

コメント


新しいウィンドウコマンド

このコマンドを使用して，プロジェクトのウィンドウをもう1つ開きます。

これを呼び出すには，ウィンドウ/新しいウィンドウを選択します。

各新しいウィンドウは，ウィンドウメニューのウィンドウ一覧に追加されます。

新しいウィンドウは，アクティブなウィンドウと同じ内容です。複数のウィンドウを開いて，プロジェクトの違う部分を同時に表示することができます。例えば，違うウィンドウを開き，違うレイヤーを各ウィンドウに表示します。

1つのウィンドウで内容を変更した場合，同じプロジェクトのほかのすべてのウィンドウは，表示している情報に変更内容を反映します。

新しいウィンドウを開くとアクティブウィンドウになり，開いている他のすべてのウィンドウの1番上に表示されます。


重ねて表示コマンド

このコマンドを使用して，複数開かれているプロジェクトのウィンドウを重ねます。

これを呼び出すには，ウィンドウ/重ねて表示を選択します。

ウィンドウは重ねられ，各ウィンドウのタイトルバーを確認できます。


並べて表示コマンド

このコマンドを使用して，現在開いているすべてのプロジェクトのウィンドウを並べ替えます。

これを呼び出すには，ウィンドウ/並べて表示を選択します。

ウィンドウはタイルのように並べられます。


アイコンの整列コマンド

このコマンドを使用して，最小化されたウィンドウのアイコンを画面にきれいに並べます。

これを呼び出すには，ウィンドウ/アイコンの整列を選択します。

アイコンはウィンドウの1番下に並べられます。


分割コマンド

このコマンドを使用して，プロジェクトの2つの部分を同時に表示します。

これを呼び出すには，ウィンドウ/分割を選択します。

ウィンドウの分割は，分割バーをクリック・ドラッグしてサイズを変更できます1箇所に行われた変更は，同時にもう一方にも発生します。


表示一覧コマンド

このコマンドを使用して，表示一覧にあるウィンドウを開きます。一覧は，開いているすべてのウィンドウを表示します。

これを呼び出すには，ウィンドウ表示一覧メニューから選択します。


World Wide Webｻｲﾄ

ﾄﾘﾝﾌﾞﾙ社のインタラクティブ情報は､World Wide Webの弊社ｻｲﾄから入手いただけます。
(www.trimble.com/)


プロパティウィンドウ　－　概要

プロパティウィンドウですべてのエンティティ(ポイント，観測，ライン，円弧，曲線，テキスト，注釈，ノート)に関する情報を見ることができます。

プロパティウィンドウを使用して，選択しているエンティティのプロパティを表示したり編集したりします。1度に1つのエンティティのプロパティしか見ることはできません。プロパティウィンドウでエンティティに行われた変更はすぐに適用されます。

プロパティウィンドウは，ウィンドウ枠をクリックしたりドラッグしたりしてサイズを変更できます。右上の角のボタンをクリックするとウィンドウを閉じます。

Trimble Geomatics Office の他の部分を使用している間もプロパティウィンドウを開いておくことができます。プロパティウィンドウは自動的に更新され，選択セットの正確な情報を表示します。

現在の選択セットの定義をし，プロパティウィンドウの選択リストからエンティティを選択して表示した場合，グラフィックウィンドウの現在の選択は更新され，表示しているエンティティだけを含みます。プロパティウィンドウの選択リストには元の選択セットが残ります。グラフィックウィンドウでは，プロパティウィンドウでハイライトされているすべてのエンティティが現在の選択セットになります。

プロパティウィンドウの系図表示は，画面で選択されている項目の名前と値を表示します。系図表示はエンティティ間の関係も表示します。例えば，プラス記号(+)をクリックすると各観測およびラインタイプエンティティの�始点�と�終点�を表示することができます。そして，表示したり編集したりしたいポイントを選択できます。

表示は節点でたたんだり広げたりできます。

プラス記号(+)をクリックして系図を広げます。

マイナス記号(�)をクリックして系図をたたみます。

選択されているエンティティタイプに従って，プロパティウィンドウの右の部分に情報とタブが表示されます。

プロパティウィンドウの選択ツール

プロパティウィンドウの選択ツールを使用すると選択セットリストを構成できます。

選択	アイコン	ボタンをクリックすると...
測量データ グループ化		ソース，データタイプ，観測方向毎の測量データのグループ化
ソート		選択設定のエンティティのソート。リストからオプションを選択します。データベースの順，標高，名前，質，開始時刻，観測の長さ，データタイプによるポイントのソートが選択できます。
フィルター		ポイントのみ，観測のみ，フラグの付いている観測のみ，現在の選択を保持。また，現在の選択を除外することもできます。 ノート： 独自のクエリーをフィルターリストに追加することもできます。
質インジケータ

質インジケータは概要ページの各フィールドの右に表示される小さい記号です。これらの記号は測量データの質を表わします。質には固定された基準点，基準点，測量，マッピング，不明，網平均があります。質インジケータはまたポイント関連レポートおよび再計算レポートで使用されます。

ジオイドインジケータ

ジオイドインジケータは，ポイントの標高または高度の要素が，プロジェクトに定義されているジオイドから求められたかどうかを表わします。ジオイドインジケータは質インジケータと共に表示されます。

例えば，RTK ポイントを観測した場合，ポイントにはWGS-84 の高度とジオイドから求められ標高があります。一般測量機のポイントを収集した場合，ポイントには標高よジオイドから求められたWGS-84 標高があります。

ジオイドインジケータはまたポイント関連レポートおよび再計算レポートで使用されます。

ジオイドモデルのジオイドの質はプロジェクトプロパティダイアログの再計算タブで決定されます。

自動ロールアップ ツール

このツール [image] を使用して、グラフィックウィンドウでエンティティを選択している時にプロパティウィンドウを最小化します。

ウィンドウを開いたままにロック

このツール [image] を使用して、プロパティウィンドウが開いている時にはそのサイズが変わらないようにします。


プロパティウィンドウ　－　測量タブ　－　概要

測量タブを使用して，選択されているエンティティの測量関連のプロパティを表示，編集します。測量に表示される次のようなエンティティのプロパティを表示できます。

ポイント

GPS 観測

一般測量機観測

レベル観測

レーザ測距儀観測

補正観測(オフセット)

ページ

測量情報は複数のページに分かれています。1度に1ページしか表示できません。メニューボタンを使用してページを呼び出せます。メニューボタンはすべての測量情報を呼び出します。また，使用できるメニューボタンは選択されているエンティティに依存します。

ポイントと観測の削除

ポイントや観測を削除するには，プロパティウィンドウの削除ボタン [image] を使用します。ポイントや観測が削除できない場合，削除ボタンは使用できません。

ノート：固定された座標は削除できません。削除する前に�固定を解除�してください。


プロパティ ウィンドウ ー測量タブ ーポイント
プロパティウィンドウ　－　測量タブ　－　ポイント

概要

プロパティウィンドウの測量タブを使用して，選択しているポイントの測量関係の情報を表示したり編集したりします。測量情報は複数のページで構成されています。

適切なメニューボタンをクリックするとしたのページを呼び出せます。

概要
警告
観測と設置setups
推定誤差


プロパティウィンドウ　－　測量タブ　－　概要ページ(ポイント)

詳細情報

利用方法

概要ページを使用して，プロパティウィンドウで選択されたポイントの求められた位置や質を表示します。

これを呼び出すには，プロパティウィンドウから、

測量タブの概要メニューボタン [image] をクリックします。

ポイント名

ポイント名を表示します。このフィールドに値を入力して名前を変更します。

座標フィールド

求められたポイントの位置と各成分に割り当てられた質を表示します。表示される座標フィールドは，表示のオプション設定に依存します。

グリッド/ローカル/WGS-84

ポイントの座標表示オプションを選択します。

ノート：表示オプションがWGS-84 に設定されている場合，表示される座標フィールドは，プロジェクトプロパティダイアログの単位とフォーマットタブでWGS-84 表示に何が設定されているかに依存します。例えば，WGS-84 表示フィールドにL,L,H  が設定されている場合，概要ページの座標フィールドは緯度，経度，高度とラベルがつけられます。WGS-84 表示フィールドにX,Y,Z  が設定されている場合，WGS-84 フィールドはX，Y，Z  と表示されます。

関連レポート

関連レポートツール [image] を選択するとポイント関連レポートを表示します。

座標追加

グリッド，ローカル，WGS-84 のオフィス入力座標をキー入力したい場合，座標追加ツール [image] を選択します。(観測から求められる座標よりもオフィス入力座標を使用したい場合のみ，この操作を行ってください。)キー入力された座標はオフィス入力ソースになります。

1つのポイントに関係するグリッド/ローカル/WGS-84 のオフィス入力座標は1つだけです。WGS-84 とグリッド/ローカルの座標が既にある場合，座標追加ツールは使用できません。

ノート：座標を追加したとき，座標成分フィールドと質はヌルです。現在のポイントの座標と質を入力するには，現在の値挿入ツール [image] を選択してください。


プロパティ ウィンドウ -測量タブ -警告ペ-ジ
プロパティウィンドウ　－　測量タブ　－　警告ページ

警告ページを使用して，測量画面のポイント，または観測上に表示される警告フラグに関係するメッセージを表示したり，非表示にしたりします。

これを行うには：

1.	次の1つを行います。

表示したい警告フラグのあるポイント，または観測をダブルクリックします。

ステータスバーの警告フラグをダブルクリックして，警告フラグのあるすべてのポイントを選択します。

プロパティウィンドウが表示されます。

2.	選択に2つ以上のエンティティがある場合，表示したいエンティティを1つ選択します。

3.	警告ページを呼び出すには，警告メニューボタン [image] をクリックします。

座標をエクスポートする前に，すべての警告フラグを解決するか非表示にしてください。良くない観測を無効にしたり，物理的に間違ったポイントへの観測であった場合には，ポイントの名前を変更したりして較差許容範囲外を解決した時にエラーフラグが消えます。

下のテーブルは，警告フラグといっしょに表示されるメッセージの説明です。

このメッセージを表示しない

エラーが測量に受け入れられると判断した場合，このチェックボックスを選択して選択されたポイント，または観測に関係する警告フラグを非表示にします。プロパティウィンドウのフラグは白になり，グラフィックウィンドウから消えます。

ノート：すべての警告を隠した場合，ステータスバーのフラグアイコンは白に変わります。

選択されたポイントがある場合，ポイント関連レポートツール [image] を選択してポイント関連レポートを表示することができます。

これを使用して，ポイントの位置がどのようにして求められたか，なぜエラーが起こったか，を判断します。


プロパティウィンドウ　－　測量タブ　－　観測と設置ページ

観測と設置ページを使用して，選択されているポイント，または観測のGPS 観測と一般測量機設置の詳細をプロパティウィンドウで表示，修正します。

下のページは，どのエンティティタイプが選択されているかとどの方法が使用されているかによって、利用できるかが決まります。

これらのページを呼び出すには，プロパティウィンドウから、

1.	観測を選択します。

2.	観測と設置メニューボタン [image] をクリックします。

ノート：ポイントに2つ以上の観測や設置がある場合，ショートカットメニューが表示されます。表示したいページを選択します。ショートカットメニューの異なる観測や設置の上にマウスを置くと，ページの詳細が更新されます。

1つのポイントに2つ以上の観測がある可能性があります。しかし，1つの観測には1つの�始点�と1つの�終点�しかありません。


プロパティウィンドウ　－　測量タブ　－　GPS 観測ページ

GPS 観測ページを使用して，選択されているポイントのGPS観測の詳細を表示，修正します。ページの内容は，ポイントが基準局として使用されていても移動局として使用されていても同じです。

このページを呼び出すには，プロパティウィンドウから、

1.	測量タブを選択します。

2.	次の1つを行います。

ポイントを選択している場合，観測と設置メニューボタン [image] を選択します。

ノート：ポイントに2つ以上の観測，または設置がある場合，ショートカットメニューが表示されます。表示したいページを選択してください。

GPS 観測を選択している場合，基準局観測ページボタン [image] をクリックして基準局観測の詳細を表示します；または，移動局観測メニューボタン [image] をクリックして移動局観測の詳細を表示します。

ポイント

観測されたポイントの名前を表示します。

時刻

観測の長さ(時間)と観測の開始時刻を表示します。

ノート：データインポート中に開始・終了時刻はGPS 時刻からUTC(協定世界時�事実上，グリニッジ標準時)へ変換されます。それから時刻はMicrosoft Windows のタイムゾーン設定を使用して現地時刻で表示されます。

ヒント：フィールドの上にポインタを置くと，観測時間の終了時刻のツールヒントが表示されます。

アンテナ詳細

アンテナ詳細グループには観測されたポイントの観測に使用されたGPS アンテナの詳細があります。

高さ

アンテナ高を表示します。観測時に高さが誤って入力された場合，キーボードから値を入力してこのフィールドを変更します。

タイプ

受信機に接続されたアンテナタイプを表示します。観測時にアンテナタイプが誤って入力された場合，リストからアンテナタイプを選択してこのフィールドを変更します。

測定方法

アンテナ高が測定された場所を表示します。観測時に測定方法が誤って入力された場合，リストからオプションを選択してこのフィールドを変更します。


プロパティウィンドウ　－　測量タブ　－　器械設置ページ

器械設置ページを使用して，選択されている観測で使用されている一般測量機の設置の詳細を表示，修正します。

このページを呼び出すには，プロパティウィンドウから、

1.	測量タブを選択します。

2.	選択されているポイントで観測と設置メニューボタン [image] をクリックします。

ノート：ポイントに2つ以上の観測，または設置がある場合，ショートカットメニューが表示されます。表示したい器械設置ページを選択してください。ポイントのすべての観測，GPS および一般測量機，をこのページに表示することができます。

器械点

観測がここから行われたポイントの名前を表示します。

器械高

観測が行われた時の器械の高さを表示します。設置時に高さが誤って入力された場合，キーボードから値を入力してこのフィールドを変更します。

後視ポイント

観測された後視ポイントの名前を表示します。

後視方位

観測された後視への計算された方位角を表示します。

ノート：後視ポイントに座標がある場合，この座標を使用して後視ポイントへの方位角を決定します。キー入力された方位角がある場合，このキー入力された方位角の質と後視ポイントを使用して計算された方位角を比較し，質の高い方の方位角が使用されます。計算された方位角とキー入力された方位角の質が同じ場合，後視を使用して計算された方位角が使用されます。


プロパティウィンドウ　－　測量タブ　－　ターゲット設置ページ

ターゲット設置ページを使用して一般測量機観測で使用されたターゲットの設置の詳細を表示，修正します。

このページを呼び出すには，プロパティウィンドウから、

1.	測量タブで一般測量機観測を選択します。

2.	ターゲット設置メニューボタン [image] をクリックして，ターゲット設置の詳細を表示します。

前視ポイント

前視ポイントの名前を表示します。

ターゲットの高さ

前視観測が行われた時の目標の高さを表示します。設置時に高さが誤って入力された場合，キーボードから値を入力してこのフィールドを変更します。

プリズム定数

観測に適用されているプリズム定数を表示します。設置時に高さが誤って入力された場合，キーボードから値を入力してこのフィールドを変更します。

観測に既にファイル内でプリズム定数が適用され、ファイルがその定数を特定しない場合には、フィールドに「？」と表示されるかもしれません。セットアップ中にエラーが発生したか、誤ったプリズム定数が入力されてフィールド内で入力された場合には、フィールドで入力されたプリズム定数と入力されるべきである定数との差を適用します。例えば、フィールドで「20」と入力したけれども、実際には「5」と入力すべきだった場合には､プリズム定数フィールドに「-15」という補正を入力します。


プロパティウィンドウ　－　測量タブ　－　GPS 位置(APC)ページ

GPS 位置(APC )ページを使用してGPS 位置の解を表示します。位置の解は下から得られます。

ディファレンシャルGPS

WAAS （Wide Area Augmentation System）

Trimble Survey Controller で [image] キーを使用

単独測位

VRS �広域RTK (フィックスかフロート)

位置の解は，測量の質，またはマッピングの質の場合，ポイントに表示されます。2つ以上の位置の解を持つことができますが，編集することはできません。

このページを呼び出すには，プロパティウィンドウから、

1.	グラフィックウィンドウでGPS 位置(APC )のあるポイントをダブルクリックします。

2.	ポイントのプロパティウィンドウの系図を広げます。

系図構造 [image] からC?soln を選択します。?は座標番号を表わします。

GPS 位置(APC )ページが表示されます。

ポイント

ポイント名を表示します。

緯度，経度，高度

ポイントに決定されたWGS-84 の座標とポイントの質が表示されます。

ノート：表示される高度は観測に使用されたGPS アンテナのアンテナ位相中心の高度です。アンテナ高は適用されていません。

プロセッサタイプ

処理方法を表示します。例､WAASや広域RTK 。

ステータス

位置の解のステータスを表示します。ステータスは再計算，または測量計算が行われる時に判断されます。このフィールドを変更するには，矢印をクリックし，ポイントに適用したいオプションをドロップダウンリストから選択します。


プロパティ ウィンドウ －測量タブ －座標 ペ－ジ
プロパティウィンドウ　－　測量タブ　－　座標ページ

詳細情報

関連項目

座標ページを使用して，選択されているポイントの座標を表示することができます。また，このページを使用して，座標の質やステータスを変更することができます。

ポイントは1つのWGS-84 の座標，1つのグリッド/ローカル座標，1つの網平均された座標を持つことができます。網平均された座標は，網平均(網平均モジュールがインストールされている場合)を行った後で作成されます。

概要ページを使用してポイントの座標を表示します。

座標ページを呼び出すには：

1.	グラフィックウィンドウでポイントをダブルクリックします。プロパティウィンドウが表示されます。

2.	ポイントの系図を広げ，座標を選択します。

ポイントの座標が表示されます。

座標フィールド

ポイントの座標成分とそれらに割り当てられた質が表示されます。表示される座標フィールドは表示オプションセットに依存し，現在の表示が保存されている座標タイプと同じ場合のみ，変更可能です。

グリッド/ローカル/WGS-84

ポイントの座標表示オプションを選択します。

ノート：表示オプションがWGS-84 に設定されている場合，表示される座標フィールドは，プロジェクトプロパティダイアログの単位とフォーマットタブでWGS-84 表示に何が設定されているかに依存します。例えば，WGS-84 表示フィールドにX,Y,Z  が設定されている場合，概要ページの座標フィールドはX，Y，Z  と表示されます。WGS-84 表示フィールドにL,L,H  が設定されている場合，WGS-84 フィールドは緯度，経度，高度とラベルがつけられます。

質選択コントロール

質選択コントロールを使用して座標成分に質を割り当てます。質は降順にリストされます。

基準点の質

測量の質

マッピングの質

不明の質

ステータス

選択されたポイントのステータスを表示します。ポイントのステータスは再計算，または測量計算が行われる時に判断されます。このフィールドを変更するには，矢印をクリックし，ポイントに適用したいオプションをドロップダウンリストから選択します。

ポイントの位置を求めるために座標を使用したくない場合，無効にします。

ポイントの位置を求めるために使用できる観測や座標が他にない場合だけ，座標を使用したい場合，チェックとして有効にします。

再計算レポートは，チェックとして有効な座標についてレポートしますが，無効な座標についてはレポートしません。

座標タイプ

座標は選択された座標タイプでデータベースに保存されます。座標を違うタイプとして保存した場合，同じタイプの既存の座標が上書きされます。


プロパティ ウィンドウ ー測量タブ ーGPS 観測
プロパティウィンドウ　－　測量タブ　－　GPS 観測

RTK，静止，FastStatic，後処理キネマティックベクトルなど，すべてのGPS 観測タイプに関する情報を表示することができます。

プロパティウィンドウの測量タブを使用して，選択されたGPS 観測の測量関係の情報を表示，編集します。測量情報は複数のページに分かれています。

適当なメニューボタンをクリックすると下のページを呼び出せます。

概要
警告
基準局観測
移動局観測
観測データ
統計


プロパティウィンドウ　－　測量タブ　－　概要ページ(GPS 観測)

概要ページは，プロパティウィンドウで選択されているGPS 観測の詳細を要約します。

1.	測量画面でGPS 観測を選択します。

2.	このページを呼び出すには，プロパティウィンドウから概要メニューボタン [image] をクリックします。

始点

観測がそこから行われた基地局の名前を表示します。

終点

観測がそこへ行われた移動局の名前を表示します。

時刻

観測の時間の長さと観測の開始時刻を表示します。

ノート：データインポート中に開始・終了時刻はGPS 時刻からUTC(協定世界時�事実上，グリニッジ標準時)へ変換されます。それから時刻はMicrosoft Windows のタイムゾーン設定を使用して現地時刻で表示されます。

ヒント：フィールドの上にポインタを置くと，観測時間の終了時刻のツールヒントが表示されます。

解析タイプ

選択されている観測に解析タイプを表示します。クラスは観測の解を決定するのに使用された解析プログラムの内容を表わします。解析タイプフィールドは：

RTK

静止またはFastStatic

後処理キネマティック

未解析　－　未解析タイプは，観測の解が基線解析プログラムで決定されるはずだが，まだ決定されていないことを意味します。

データ取得方法

観測に使用されたGPS 測量方法を表示します。

地形

連続

観測した基準点

ラピッド

静止またはFastStatic

イベント

ストップ アンド ゴー

ステータス

選択された観測のステータスを表示します。ステータスは再計算，または測量計算が行われる時に判断されます。このフィールドを使用して，良くない解析(観測に較差があったような場合)を無効にします。

このフィールドを変更するには，矢印をクリックし，観測に適用したいオプションをドロップダウンリストから選択します。

ポイントの位置を求めるために観測を使用したくない場合，無効にします。

ポイントの位置を求めるために使用できる観測や座標が他にない場合だけ，観測を使用したい場合，チェックとして有効にします。

再計算レポートは，チェックとして有効な観測についてレポートしますが，無効な観測についてはレポートしません。

網平均で使用

選択された観測を網平均(網平均モジュールをインストールしている場合)に使用したくない場合，このチェックボックスをクリアします。しかし，データベースが再計算で計算される場合には使用されます。

観測に共分散情報も標準誤差情報もない場合，このオプションは使用できません。

観測が無効の場合，このオプションは使用できません。


プロパティウィンドウ　－　測量タブ　－　観測ページ(GPS 観測)

観測ページを使用して，選択されている観測のアクティブな解を選択したり，基線成分を表示したりします。

1.	測量画面で基線を選択します。

2.	このページを呼び出すには，プロパティウィンドウから観測メニューボタン [image] をクリックします。

選択されている解

選択されている基線解を表示します。違う解析スタイルを使用して2回以上基線解析し(基線解析モジュールがインストールされている場合)，GPS 解析ダイアログで重複基線解を上書きしないを選択した場合，基線は2つ以上の解を持つはずです。しかし，基線はアクティブな解を1つしか持てません。この解が再計算や網平均で使用されるます。矢印をクリックし，ドロップダウンリストから観測をアクティブにしたい最適解を選択します。

ヒント：解の上にポインタを置くと，基線結果のツールヒントを表示します。

解のタイプ

選択された観測の解のタイプを表示します。

dX，dY，dZ

表示オプションがXYZ に設定されているとき，GPS 観測のデルタの値をWGS-84 地心座標で表示します。

測地前方方位，楕円体距離，デルタ高度

表示オプションが測地に設定されているとき，GPS 基線の成分をローカル楕円体で表示します。

ノート：測地前方方位は基準局から移動局への方向の測地前方方位を参照します。

dN，dE，dU

表示オプションがNEUに設定されているとき，ローカル測地水平面上のデルタ北距，東距，高さの値で表示します。

地上ポイントから地上ポイントへの詳細表示

このチェックボックスを選択し，基線の成分の値を基準局と移動局の受信機で観測された標識の地表高度に換算して表示します。

チェックボックスがクリアされている場合，基線の成分は，基準局のアンテナ位相中心から移動局のアンテナ位相中心への値が表示されます。下の図でこの差を表示します。


プロパティウィンドウ　－　測量タブ　－　観測ページ(位置の解)

観測ページを使用して，選択されている観測のアクティブな解を選択したり，基線成分を表示したりします。

1.	測量表示で基線を選択します。

2.	このページを呼び出すには，プロパティウィンドウから観測メニューボタン [image] をクリックします。

プロセッサタイプ

処理方法を表示します。例､WAASや広域RTK

フィールド方法

使用されるフィールド方法を示します。例、継続

解のタイプ

選択された観測の観測解のタイプを表示します。例、L1フロート


プロパティウィンドウ　－　測量タブ　－　観測統計ページ(GPS 観測)

観測統計は基線の観測タイプに従って適切な解の統計と質のインジケータを表示します。統計はRTK 観測と静止/FastStatic観測では異なります。

このページを使用して，解の質をチェックします。

1.	測量画面で基線を選択します。

2.	このページを呼び出すには，プロパティウィンドウから観測統計メニューボタン [image] をクリックします。

RTK 観測を表示している場合，下のフィールドが観測統計ページに表示されます。

観測数

観測を完了するために収集された観測数(エポック)を表示します。

最少衛星数

観測中，基準局受信機，および移動局受信機で捕捉された衛星の最少数を表示します。

RMS

Root Mean Square (RMS)を表示します。RMS の値は基線解の決定に使用された計測の精度を表わします。

斜距離

観測の斜距離を表示します。

水平精度

観測の解の決定に使用された観測の水平精度を表示します。

垂直精度

観測の解の決定に使用された観測の垂直精度を表示します。

PDOP/RDOP

キネマティック基線の位置精度劣化(PDOP)の値，または静止基線の相対精度劣化(RDOP)の値を表示します。RDOP は時間の経過によって小さくなります。

後処理基線を表示している場合，下のフィールドが観測統計ページに表示されます。

レシオ

解析の整数値サーチで生成された2つの分散，最適の観測，のレシオを表示します。

リファレンスバリアンス

リファレンスバリアンスを表示します。リファレンスバリアンスは，基線の観測されたデータが計算された解にどれだけうまく適合しているかのインジケータです。

RMS

Root Mean Squareを表示します。RMS の値は基線解の決定に使用された観測の精度を表わします。

斜距離

観測の斜距離を表示します。

水平精度

観測の解の決定に使用された観測の水平精度を表示します。

垂直精度

観測の解の決定に使用された観測の垂直精度を表示します。

RDOP

相対精度劣化の値を表示します。


プロパティウィンドウ　－　測量タブ　－　観測統計ページ(位置の解)

観測統計ページは、適切な解の統計と質のインジケータタイプを表示します。

このページを使用して，解の質をチェックします。

1.	測量表示で基線を選択します。

2.	このページを呼び出すには，プロパティウィンドウから観測統計メニューボタン [image] をクリックします。

水平精度

位置の解の決定に使用された観測の水平精度を表示します。

垂直精度

位置の解の決定に使用された観測の垂直精度を表示します。

RMS

RMS（自乗平均）を表示します。RMS の値は基線解の決定に使用された計測の精度を表わします。

PDOP

基線に対する位置精度劣化(PDOP)の値を表示します。

最少衛星数

観測中に捕捉された衛星の最少数を表示します。

GPS 位置数

解に使用されたGPS 位置の数を表示します。


プロパティ ウィンドウ ー測量タブ ー一般測量機観測
プロパティウィンドウ　－　測量タブ　－　一般測量機観測

現場でトータルステーションやセオドライトのような一般測量機器を使用して観測された，すべての一般測量機観測の情報を表示することができます。

プロパティウィンドウの測量タブを使用して，選択された一般測量機観測の測量関係の情報を表示し，また設置の詳細を編集します。測量情報は複数のページに分かれています。

適当なメニューボタンをクリックすると下のページを呼び出せます。

概要
ターゲット設置
観測
観測統計
ノート：一般測量機観測は3つの構成で次の順に表わされます。後視ポイント名，器械点名，前視ポイント名。


プロパティウィンドウ　－　測量タブ　－　概要ページ(一般測量機観測)

概要ページは，プロパティウィンドウで選択されている一般測量機観測の詳細を要約します。

1.	測量画面で観測を選択します。

2.	このページを呼び出すには，プロパティウィンドウから概要メニューボタン [image] をクリックします。

器械点

観測が行われた器械設置に使用されたポイントの名前を表示します。

器械高

器械の高さを表示します。

後視ポイント

後視をして使用されたポイントの名前を表示します。

前視ポイント

観測が行われた目標ポイントの名前を表示します。

ステータス

選択された観測のステータスを表示します。ステータスは再計算，または測量計算が行われる時に判断されます。

このフィールドを変更するには，矢印をクリックし，観測に適用したいオプションをドロップダウンリストから選択します。

ポイントの位置を求めるために観測を使用したくない場合，無効にします。

観測が後視ポイントのチェックの場合，チェックとして有効にします。これは，閉合にレポートされますが，座標の決定には使用されないことを確かにします。

再計算レポートは，チェックとして有効な観測についてレポートしますが，無効な観測についてはレポートしません。

網平均で使用

選択された観測を網平均(網平均モジュールをインストールしている場合)に使用したくない場合，このチェックボックスをクリアします。しかし，再計算には使用されます。


プロパティウィンドウ　－　測量タブ　－　観測ページ(一般測量機観測)

観測ページを使用して，選択されている観測の器械とターゲット間の観測成分を表示します。

1.	測量画面で観測を選択します。

2.	このページを呼び出すには，プロパティウィンドウから観測メニューボタン [image] をクリックします。

後視方位

器械点と後視ポイント間の計算された方位角と質を表示します。

ノート：後視に座標がある場合，この座標は後視ポイントへの方位を決定するために使用されます。また，キー入力された方位角がある場合，このキー入力された方位角の質は，後視ポイントの座標を使用して計算された方位角と比較され，より質の高い方位角が使用されます。計算された方位角とキー入力された方位角の質が同じ場合，計算された方位角が使用されます。

水平角，高度角，斜距離

表示オプションがHA,VA,SD  に設定されている場合，観測成分の値を表示します。

方位角，水平距離，デルタ標高

表示オプションがAZ,HD,VD  に設定されている場合，グリッド座標に変換した観測成分の値を表示します。

ノート：インポート中に，大気補正・曲率補正・屈折率補正を観測に適用します。水平観測は後視ポイントからの角度に換算されます。高度角は曲率と屈折率で補正されます。PPM補正が斜距離に適用されます。

観測タイプ

観測が行われた時に使用された機器の面(正，反)，または正位と反位の観測が測定されたかを表示します。平均観測は後視ポイントと観測されるポイント間を同じ設置で観測した1組の正/反の平均を意味します。

観測はまた，Trimble Survey Controller の平均回転角から求められることもあります。(例えば角観測が行われた場合)

地上ポイントから地上ポイントへの詳細表示

このチェックボックスを選択し，観測を器械点と前視ポイントで観測された標識の地表高度に換算して表示します。


プロパティ ウィンドウ -測量タブ -レベル観測
プロパティ ウィンドウ　－　測量 タブ　－　レベル観測

現場で観測されたすべてのレベル観測の情報を表示することができます。選択されたレベル観測の測量関係の情報を表示するには，プロパティウィンドウの測量タブを使用します。

測量タブの情報は複数のページに分かれています。ページを呼び出すには，下の適当なメニューボタンをクリックします。

概要
観測統計
ノート：レベル観測データを使用して網平均を行うつもりの場合，レベル観測に標準誤差が定義されている必要があります。標準誤差は次の場合に計算されます。

デジタルレベルデータをインポートした場合，標準誤差は変曲点の数と網平均スタイル編集ダイアログ(一般測量機コントロールタブ)の標尺読み取り誤差を使用して計算されます。

レベルデータをTrimble Data Exchange フォーマットにインポートする場合で，Trimble Data Exchange フォーマットに変曲点の数を挿入する場合，デルタ標高の標準誤差は変曲点の数をベースに計算されます。Trimble Data Exchange フォーマットにデルタ標高の標準誤差を挿入する場合，この値が使用されます。

標準誤差が定義されていなかったり計算されなかった場合，そのレベル観測は網平均に使用できません。

プロパティウィンドウで各観測の標準誤差を入力することができます。


プロパティウィンドウ　－　測量タブ　－　概要ページ(レベル観測)

プロパティウィンドウの概要ページは選択されているレベル観測の詳細を要約します。

1.	レベル観測を選択します。

2.	このページを呼び出すには，プロパティウィンドウから概要メニューボタン [image] をクリックします。

始点

レベル観測を始めたポイントの名前を表示します。

終点

レベル観測を終わったポイントの名前を表示します。

デルタ標高

�始点�と�終点�間の標高の差を表示します。

ステータス

このリストから，観測に設定したいステータスを選択します。このステータスは再計算，または測量計算が行われる時に判断されます。

観測がポイントのチェックの場合，チェックとして有効にします。これは，閉合にレポートされますが，標高の決定には使用されないことを確かにします。ポイントの位置の決定に観測を使用したくない場合，無効にします。

再計算レポートは，チェックとして有効なレベル観測についてレポートしますが，無効な観測についてはレポートしません。


プロパティウィンドウ　－　測量タブ　－　観測統計ページ(レベル観測)

観測統計ページは適切な統計と質のインジケータを表示します。

このページを呼び出すには，プロパティウィンドウから、

測量タブの観測統計メニューボタン [image] をクリックします。

標準誤差( デルタ標高 )

この値はデルタ標高標準誤差を表わします。誤差は下の場合に計算されます。

デジタルレベルファイルをインポートするとき(デルタ標高標準誤差は変曲点の数と標尺読み取り誤差をベースに計算されます)。

レベルデータをTrimble Data Exchange フォーマットにインポートするとき。Trimble Data Exchange フォーマットに変曲点の数を挿入する場合，デルタ標高標準誤差は変曲点の数をベースに計算されます。Trimble Data Exchange フォーマットにデルタ標高標準誤差を挿入する場合，この値が使用されます。

また，独自の標準誤差を入力することもできます。

変曲点の数

これは2点間の標高差を決定するために設置された器械点の数です。

ラインの長さ

これはレベルの路線の長さです。これは後視と前視の距離を加算することによって計算されます。


プロパティウィンドウ　－　測量タブ　－　レーザー測距儀観測

現場でレーザー測距儀を使用して観測された，すべての一般測量機観測の情報を表示することができます。

プロパティウィンドウの測量タブを使用して，選択されたレーザ測距儀観測の測量関係の情報を表示，編集します。測量情報は複数のページに分かれています。

適当なメニューボタンをクリックすると下のページを呼び出せます。

概要
観測データ


プロパティ ウィンドウ -測量タブ -概要ペ-ジ (レ-ザ-測距儀観測)
プロパティウィンドウ　－　測量タブ　－　概要ページ(レーザー測距儀観測)

概要ページは，プロパティウィンドウで選択されている一般測量機観測の詳細を要約します。

このページを呼び出すには，プロパティウィンドウから、

測量タブの概要メニューボタン [image] をクリックします。

器械点

レーザー測距儀観測が行われたポイントを表示します。

器械高

機器の高さを表示します。

ターゲットポイント

レーザー測距儀観測が行われたポイントを表示します。

ターゲットの高さ

ターゲットの高さを表示します。

ステータス

選択された観測のステータスを表示します。観測のステータスは再計算，または測量計算が行われる時に判断されます。このフィールドを変更するには，矢印をクリックし，観測に適用したいオプションをドロップダウンリストから選択します。

ポイントの位置を求めるために観測を使用したくない場合，無効にします。

ポイントの位置を求めるために使用できる観測や座標が他にない場合だけ，観測を使用したい場合，チェックとして有効にします。

再計算レポートは，チェックとして有効な座標についてレポートしますが，無効な座標についてはレポートしません。


プロパティウィンドウ　－　測量タブ　－　観測ページ(レーザー測距儀観測)

観測ページを使用して観測の成分を表示し，選択された観測に使用された機器とターゲット間の磁気偏差を編集します。

このページを呼び出すには，プロパティウィンドウから、

測量タブの観測メニューボタン [image] をクリックします。

磁気方位

観測の観測された磁気方位角を表示します。

偏差

磁北と真北間の磁気偏差を表示します。この値は，真北方位を計算するために必要です。キーボードから値を入力してこのフィールドを変更することもできます。

高度角

観測が行われたとき測定された高度角を表示します。この値がヌルの場合，距離は水平と想定されます。

斜距離

観測の斜距離を表示します。


プロパティ ウィンドウ －ノートタブ
プロパティウィンドウ　－　注釈タブ

概要

注釈レコードは，データベースのグラフィカルでないエンティティです。つまり，グラフィックウィンドウには表示されません。また，グラフィックウィンドウで選択できません。

Trimble Survey Controller からユーザが入力した注釈をジョブにインポートしている場合，プロパティウィンドウの注釈タブを使用して注釈レコードを表示します。

このタブを呼び出すには，

1.	下の1つを行います。

選択/選択セット。表示したい注釈を含む.dc ファイルを選択します。

選択/クエリー/注釈を選択します。

2.	プロパティウィンドウを開きます。

プロパティウィンドウは，すべての注釈エンティティを鉛筆アイコン [image] で表示します。


プロパティウィンドウ　－　CAD タブ(ポイント)

プロパティウィンドウのCAD  タブを使用して，選択されたポイントのCAD関係の情報を表示，編集します。

レイヤー

選択されたポイントが割り当てられているレイヤーを表示します。リストからレイヤーを選択するか，キーボードから新しいレイヤーの名前を入力してこのフィールドを変更してください。

ポイントスタイル

ポイントスタイルをリストから表示，選択します。

特徴コード

選択されたポイントの特徴コードを表示，入力します。

説明

選択されたポイントの説明を表示，入力します。


プロパティウィンドウ　－　ラインタブ

ラインタブを使用して選択されたラインエンティティのフィールドを表示，修正します。

このタブを呼び出すには，平面図画面から下の1つを行います。

ラインエンティティをダブルクリックする。

グラフィックウィンドウからラインエンティティを選択し，プロパティウィンドウを開く。

始点

選択されたラインの�始点�の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

終点

選択されたラインの�終点�の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

方位角

�始点�と�終点�間の方位角を表示します。

距離

�始点� と �終点� 間の距離を表示します。

レイヤー

選択されているラインエンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

ラインスタイル

選択されたラインのラインスタイルを表示します。リストからラインスタイルを選択してこのフィールドを変更します。


プロパティウィンドウ　－　曲線タブ

曲線タブを使用して選択された曲線エンティティのフィールドを表示，修正します。

このタブを呼び出すには，平面図画面から下の1つを行います。

曲線エンティティをダブルクリックする。

グラフィックウィンドウから曲線エンティティを選択し，プロパティウィンドウを開く。

始点

選択された曲線の�始点�の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

終点

選択された曲線の�終点�の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

入射角，出射角

選択された曲線の接線を表示します。キーボードから値を入力してこのフィールドを変更します。

曲率

選択された曲線にどれくらいの(湾曲の)幅があるか定義します。0 ～1 の値を入力してこのフィールドを変更します。

レイヤー

選択された曲線エンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

ラインスタイル

選択された曲線のラインスタイルを表示します。リストからラインスタイルを選択してこのフィールドを変更します。


プロパティウィンドウー円弧タブ

円弧タブを使用して選択された円弧エンティティのフィールドを表示，修正します。

このタブを呼び出すには，平面図画面から下の1つを行います。

曲線エンティティをダブルクリックする。

グラフィックウィンドウから曲線エンティティを選択し，プロパティウィンドウを開く。

始点

選択された円弧の�始点�の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

終点

選択された円弧の�終点�の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

中心

選択された円弧の�中心�点の名前を表示します。キーボードからポイント名を入力してこのフィールドを変更します。

北距，東距

円弧の中心点の座標を表示します。キーボードから値を入力してこのフィールドを変更します。

ノート：円弧の中心点が定義されている場合，座標は使用されません。中心点が使用されます。

レイヤー

選択された円弧エンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

ラインスタイル

選択された円弧のラインスタイルを表示します。リストからラインスタイルを選択してこのフィールドを変更します。

円弧は180ﾟ未満です

このチェックボックスは標準で選択されています。このチェックボックスをクリアすると選択された円弧の角度に180ﾟ以上を適用します。


プロパティウィンドウ　－　ポイント注釈タブ

ポイント注釈タブを使用して，選択されたポイントに割り当てられた注釈エンティティのフィールドを表示，編集します。

このタブを呼び出すには，平面図画面から下の1つを行います。

注釈エンティティをダブルクリックする。

グラフィックウィンドウから注釈エンティティを選択し，プロパティウィンドウを開く。

ポイント

選択された注釈エンティティが割り当てられているポイントの名前を表示します。

テキスト表現

選択された注釈エンティティのテキスト表現を表示します。テキスト表現にはテキスト定義，または注釈テンプレートに挿入されているフィールドコードが考えられます。キーボードから値を入力してこのフィールドを変更します。

東距，北距

選択された注釈エンティティの標準の�基本線左�アンカーの位置に対する座標を表示します。キーボードから値を入力してこのフィールドを変更します。

方位オフセット

注釈エンティティの方位オフセットを表示します。キーボードから値を入力してこのフィールドを変更します。

レイヤー

選択されている注釈エンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

テキストスタイル

選択された注釈エンティティのテキストスタイルを表示します。リストからテキストスタイルを選択してこのフィールドを変更します。


プロパティウィンドウ　－　ライン注釈タブ

ライン注釈タブを使用して，選択されたラインエンティティに割り当てられた注釈エンティティのフィールドを表示，編集します。

このタブを呼び出すには，平面図画面から下の1つを行います。

注釈エンティティをダブルクリックする。

グラフィックウィンドウから注釈エンティティを選択し，プロパティウィンドウを開く。

ライン

選択された注釈エンティティが割り当てられているラインの定義に使用されているポイントの名前を表示します。

テキスト表現

選択された注釈エンティティのテキスト表現を表示します。テキスト表現にはテキスト定義，または注釈テンプレートに挿入されているフィールドコードが考えられます。キーボードから値を入力してこのフィールドを変更します。

東距，北距

選択された注釈エンティティの標準の�基本線左�アンカーの位置に対する座標を表示します。キーボードから値を入力してこのフィールドを変更します。

方位オフセット

注釈エンティティの方位オフセットを表示します。キーボードから値を入力してこのフィールドを変更します。

レイヤー

選択されている注釈エンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

テキストスタイル

選択された注釈エンティティのテキストスタイルを表示します。リストからテキストスタイルを選択してこのフィールドを変更します。


プロパティウィンドウ　－　円弧注釈タブ

円弧注釈タブを使用して，選択された円弧エンティティに割り当てられた注釈エンティティのフィールドを表示，編集します。

このタブを呼び出すには，平面図画面から下の1つを行います。

注釈エンティティをダブルクリックする。

グラフィックウィンドウから注釈エンティティを選択し，プロパティウィンドウを開く。

円弧

選択された注釈エンティティが割り当てられている円弧の定義に使用されているポイントの名前を表示します。

テキスト表現

選択された注釈エンティティのテキスト表現を表示します。テキスト表現にはテキスト定義，または注釈テンプレートに挿入されているフィールドコードが考えられます。キーボードから値を入力してこのフィールドを変更します。

東距，北距

選択された注釈エンティティの標準の�基本線左�アンカーの位置に対する座標を表示します。キーボードから値を入力してこのフィールドを変更します。

方位オフセット

注釈エンティティの方位オフセットを表示します。キーボードから値を入力してこのフィールドを変更します。

レイヤー

選択されている注釈エンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

テキストスタイル

選択された注釈エンティティのテキストスタイルを表示します。リストからテキストスタイルを選択してこのフィールドを変更します。


プロパティウィンドウ　－　テキストタブ

テキストタブを使用して選択されたテキストエンティティのフィールドを表示，編集します。

このタブを呼び出すには，平面図画面から下の1つを行います。

テキストエンティティをダブルクリックする。

グラフィックウィンドウからラインエンティティを選択し，プロパティウィンドウを開く。

テキスト表現

選択されたテキストエンティティのテキスト表現を表示します。テキスト表現にはテキスト定義，または挿入されているフィールドコードが考えられます。キーボードから値を入力してこのフィールドを変更します。

東距，北距

選択されたテキストエンティティの指定されたアンカータイプへの座標を表示します。キーボードから値を入力してこのフィールドを変更します。

方位オフセット

テキストエンティティの方位オフセットを表示します。キーボードから値を入力してこのフィールドを変更します。

レイヤー

選択されているテキストエンティティに割り当てられているレイヤーを表示します。リストからレイヤーを選択し，またはキーボードから新しいレイヤーの名前を入力してこのフィールドを変更します。

テキストスタイル

選択されたテキストエンティティのテキストスタイルを表示します。リストからテキストスタイルを選択してこのフィールドを変更します。


プロパティウィンドウ　－　属性タブ

プロパティウィンドウの属性タブを使用してプロジェクトの属性を管理します。プロパティウィンドウにより，Trimble Geomatics Office の属性を表示，編集，追加，削除できます。

このタブを呼び出すには，プロパティウィンドウから

属性タブを選択します。

ノート：属性タブを呼び出す前に，必ずプロジェクトの属性を設定してください。

属性選択ツール

属性選択ツールはポイントに選択されている属性を表示します。ポイントに2つ以上の属性が割り当てられている場合，矢印をクリックしてドロップダウンリストから表示したい属性を選択します。

属性名

選択されたポイントに割り当てられている属性プロパティの名前を表示します。

値

選択されたポイントに割り当てられている属性プロパティの値を表示します。属性値を編集するには，適切なフィールドをクリックしてリストから値を選択，またはメニューリストが使用できない場合はキーボードからフィールドに値を入力します。


プロパティウィンドウ　－　全般タブ

プロパティウィンドウの全般タブはエンティティを選択しないでプロパティウィンドウを開いたとき，またはプロパティウィンドウの選択リストで2つ以上のエンティティをハイライトしているときに表示されます。

全般タブは�項目が選択されていません�というメッセージを表示します。

エンティティのプロパティを表示するには，グラフィックウィンドウ，またはプロパティウィンドウの選択リストからエンティティを選択します。


プロパティウィンドウ -測量タブ-補正観測
プロパティウィンドウ　－　測量タブ　－　補正観測

現場でTrimble Survey Controller を使用して観測されたオフセットのような補正の一般測量機観測の情報を表示する事ができます。

プロパティウィンドウの測量タブを使用して，選択された観測の測量関係の情報を表示，編集します。測量情報は複数のページに分かれています。

測量タブからページを呼び出すには，メニューボタンをクリックします。下のページを呼び出せます。

概要
観測


プロパティウィンドウ　－　測量タブ　－　概要ページ(補正観測)

概要ページは，プロパティウィンドウで選択されている補正観測の詳細を要約します。

このページを呼び出すには，プロパティウィンドウから、

測量タブの概要ページボタン [image] をクリックします。

始点

観測がそこから行われたポイントの名前を表示します。

終点

観測がそこへ行われたポイントの名前を表示します。

ステータス

選択されたオフセット観測のステータスを表示します。観測のステータスは再計算，または測量計算が行われる時に判断されます。このフィールドを変更するには，矢印をクリックし，観測に適用したいオプションをドロップダウンリストから選択します。


プロパティウィンドウ　－　測量タブ　－　観測ページ(補正観測)

観測ページを使用して，補正観測の観測成分を表示します。

このページを呼び出すには，プロパティウィンドウから、

測量タブの観測メニューボタン [image] をクリックします。

方位角

観測の観測された方位角を表示します。

水平距離

観測の測定された水平距離を表示します。

垂直距離

観測の測定された垂直距離を表示します。


座標　－　概要

詳細情報

関連項目

ポイントの既知座標をTrimble Geomatics Office のプロジェクトに入力すると，座標は他の測量データと共にその座標に保存されます。各ポイントは1つのユーザ入力されたWGS-84 座標，1つのユーザ入力されたグリッド/ローカル座標を持つことができます。

既存のユーザ入力座標を編集する場合，古い座標は新しい座標に置き換えられます。

既存のポイントの座標を次の方法で入力することができます。

プロパティウィンドウ/新しい座標追加ボタン

ポイントダイアログ(網平均モジュールをインストールしている場合)

データベースに既にあるポイントの座標を含むファイルのインポート

キー入力座標のある新しいポイントの座標を次の方法で入力することができます。

ポイント挿入ダイアログ

データベースにないポイントの座標を含むファイルのインポート

Trimble Geomatics Office に入力されたすべての座標は，内在するポイントの座標として追加され，プロパティウィンドウに別々の座標ページで表示する事ができます。

ノート：ポイントの位置を表示するには，概要ページを使用します。入力された座標は，ポイントの観測と同じ(または高い)質の場合，ポイントの位置として使用されます。


プロパティ ウィンドウ -杭打ちタブ-概要
プロパティウィンドウ　－　杭打ちタブ　－　概要

杭打ちタブは，現場でTrimble Survey Controller を使用してくい打ちされたポイントに関する情報を表示します。下のページが杭打ちタブから使用できます。

杭打ちのデルタ

ライン等の詳細

キャッチ(Catch )ポイント

ストーリーボード

DTM


プロパティ ウィンドウ -杭打ちタブ -杭打ちのデルタペ-ジ
プロパティウィンドウ　－　杭打ちタブ　－　杭打ちのデルタページ

杭打ちのデルタページを使用して，設計ポイントと杭打ちポイントの位置の差を表示します。

このページを呼び出すには，プロパティウィンドウから、

杭打ちタブの杭打ちのデルタメニューボタン [image] をクリックします。

方法

このフィールドは杭打ちされた要素を表示します。例えば，ポイント，ライン，円弧，道路です。

極座標オプションが選択されている場合，下のフィールドが表示されます。

方位角

このフィールドは設計ポイントから杭打ちポイントへの方位角を表示します。

長さ

このフィールドは設計ポイントから杭打ちポイントへの距離を表示します。

グリッドデルタオプションが選択されている場合，下のフィールドが表示されます。

デルタ北距

このフィールドは設計ポイントと杭打ちポイントの北距の差を表示します。

デルタ東距

このフィールドは設計ポイントと杭打ちポイントの東距の差を表示します。

ステーションとオフセットオプションが選択されている場合，下のフィールドが表示されます。

デルタステーション

このフィールドは設計ポイントと杭打ちポイントの距離(設計中心線に平行)の差を表示します。

デルタオフセット

このフィールドは設計ポイントと杭打ちポイントの距離(設計中心線への垂線)の差を表示します。

デルタ標高

このフィールドは設計ポイント(杭打ちされるポイントにおける)と杭打ちポイントの標高の差を表示します。

切土 / 盛土

このフィールドは設計ポイント(実際に杭打ちされたポイントにおける)と杭打ちポイントの標高の差を表示します。

下記の場合を除けば、デルタ標高と切土/盛土は同一です。

設計面は水平面でない。かつ

杭打ちポイントの水平誤差に重大な誤差がある。

下の図は，設計面が水平面でないときのデルタ標高と切土/盛土の違いを表わします。

杭打ちポイントがキャッチ(catch )ポイントの場合，レポートされるデルタは，杭打ちした位置から計算されたキャッチ(catch )ポイントです。


プロパティ ウィンドウ－ 杭打ち タブ　－　ライン等の詳細

ラインの詳細ページを使用してライン状の特徴(例えば，ライン，円弧，道路)からの杭打ちの詳細を表示します。

このページを呼び出すには，プロパティウィンドウから、

杭打ちタブのライン等の詳細メニューボタン [image] をクリックします。

名前

このフィールドはポイントがそこから杭打ちされたライン状の特徴の名前を表示します。

ステーション

このフィールドは杭打ちに選択されたポイントの設計ステーションを表示します。

水平オフセット

このフィールドは設計ポイントから杭打ちポイントへの水平オフセットを表示します。道路の場合，このフィールドは水平工事オフセットを表示します。

垂直オフセット

このフィールドは設計ポイントから杭打ちポイントへの垂直オフセットを表示します。道路の場合，このフィールドは垂直工事オフセットを表示します。

道路が杭打ちされた場合，下のフィールドも表示されます。

設計オフセット

このフィールドは杭打ちされたポイントの設計オフセットを表示します。

設計標高

このフィールドは杭打ちされたポイントの設計標高を表示します。

特徴名

このフィールドは特徴名を表示します。

 水平オフセットの方法

このフィールドは水平オフセットがどのように適用されたか表示します。水平オフセットの適用方法は：

水平

前のテンプレート要素の斜面


プロパティ ウィンドウ -杭打ちタブ -キャッチ(Catch )ポイント
プロパティウィンドウ－杭打ちタブ　－　キャッチ(Catch )ポイント

キャッチ(catch )ポイントページを使用してキャッチ(catch )ポイントに関する詳細を表示します。このオプションは，杭打ちされたポイントが道路のキャッチ(catch )ポイントのところのみ，使用可能です。

このページを呼び出すには，プロパティウィンドウから、

杭打ちタブのキャッチ(catch )ポイントメニューボタン [image] をクリックします。

設計面が現況面と交わるポイントをキャッチ(catch )ポイントと呼びます。下の図は一般的な道路の断面図を表わします。

ここで：

A =中心線への距離

B =キャッチ(catch )ポイントからヒンジ(hinge )ポイントへの水平距離

C =キャッチ(catch )ポイントからヒンジ(hinge )ポイントへの垂直距離

D =サイドスロープ(side slope )

E =ヒンジ(hinge )ポイントへの斜距離

F =工事水平オフセット

G =切土する側溝幅

H =ヒンジ(hinge )ポイント

J =キャッチ(catch )ポイント

サイドスロープ(side slope )

このフィールドはサイドスロープ(side slope )の値を表示します。

切土する側溝幅

このフィールドは切土する側溝幅の値を表示します。上の図では敵�で表わされています。

サイドスロープ(side slope )タイプ

このフィールドはサイドスロープ(side slope )タイプ(例えば，切土または盛土)を表示します。

中心線への水平距離

このフィールドは杭打ちしたキャッチ(catch )ポイントから中心線への水平距離を表示します。

標高

このフィールドはキャッチ(catch )ポイントの杭打ちされた標高を表示します。

ヒンジ(hinge )への水平距離

このフィールドはキャッチ(catch )ポイントからヒンジ(hinge )ポイントへの水平距離を表示します。

ヒンジ(hinge )への垂直距離

このフィールドはキャッチ(catch )ポイントからヒンジ(hinge )ポイントへの垂直距離を表示します。

ヒンジ(hinge )への斜距離

このフィールドはキャッチ(catch )ポイントからヒンジ(hinge )ポイントへの斜距離を表示します。

斜距離と工事オフセット

このフィールドは杭打ちポイントからヒンジ(hinge )ポイントへの斜距離を表示します。上の図では，ヒンジ(hinge )ポイント滴�から定義されたポイントへの斜距離として表わされています。このポイントは，杭打ちポイントと延長したサイドスロープ(side slope )が交わる点によって定義されています。次の場合，この値はヌル(?)です。

水平工事オフセットが適用されていない

水平工事オフセットが水平に適用されている


プロパティ ウィンドウ　－　杭打ち タブ　－　ストーリーボード

ストーリーボードページを使用して，キャッチ(catch )ポイントからテンプレート上のポイントへの距離を表示します。

このページを呼び出すには，プロパティウィンドウから、

杭打ちタブのストーリーボードメニューボタン [image] をクリックします。

名前

このフィールドはテンプレート上のポイントの名前を表示します。

キャッチ(catch )ポイントからの水平距離

このフィールドはキャッチ(catch )ポイントからテンプレート上のポイントへの水平距離を表示します。

キャッチ(catch )ポイントからの垂直距離

このフィールドはキャッチ(catch )ポイントからテンプレート上のポイントへの垂直距離を表示します。


プロパティ ウィンドウ- 杭打ちタブ- DTM
プロパティウィンドウ　－　杭打ちタブ　－　DTM

DTM  ページを使用して杭打ちされたDTMポイントの詳細を表示します。

このページを呼び出すには，プロパティウィンドウから、

杭打ちタブのDTM メニューボタン [image] をクリックします。

DTM 名

このフィールドはDTM の名前を表示します。

垂直オフセット

このフィールドはDTM と杭打ちされる面の間に指定された垂直オフセットを表示します。

切土 / 盛土

このフィールドはDTM(垂直オフセットを含む)と杭打ちされたポイント間の標高の差を表示します。


プロパティ ウィンドウ -測量タブ -方位角観測
プロパティ ウィンドウ　－　測量 タブ　－　方位角観測

プロパティウィンドウの測量タブを使用して，方位角観測を表示，編集します。測量の情報は複数のページに分かれています。

下の適当なメニューボタンをクリックしてページを呼び出すことができます。

概要
警告
観測統計


プロパティウィンドウ　－　測量タブ　－　概要ページ(方位角観測)

概要ページは，プロパティウィンドウで選択されている方位角観測の詳細を要約します。

1.測量画面で方位角観測を選択します。

2.このページを呼び出すには，プロパティウィンドウから概要メニューボタン [image] をクリックします。

ノート：方位角観測はAZ が頭に付いています。

始点

観測がそこから行われた基準のポイントの名前を表示します。

終点

方位観測がそこまで行われたポイントの名前を表示します。

方位角

このフィールドは始点と終点間の方位角を表示します。グリッド方位角，または測地前方方位角が表示できます。このフィールドは，方位角タイプと方位角の表示フィールドが同じ場合のみ，編集可能です。

質

これは方位角観測の質を表示します。

方位角タイプ

このグループはデータベースに保存されている方位角がグリッド方位角か，測地前方方位角か表示します。このフィールドは編集できません。

ノート：�終点�に方位角がない場合，グリッド方位角と測地前方方位角間の偏差は計算できません。この場合，方位角はヌル(?)で表示されます。

方位角表示

これらの表示オプションを使用して，方位角がプロパティウィンドウにどのように表示される選択します。

グリッド�このオプションを選択してグリッド方位角を表示します。

測地前方方位�このオプションを選択して測地前方方位角を表示します。

ノート：方位角フィールドを編集したい場合，方位角タイプフィールドの情報とこの表示オプションを同じにしてください。

ステータス

このリストから，観測に設定したいステータスを選択します。このステータスは再計算，または測量計算が行われる時に判断されます。

使用できる観測や座標が他にない場合だけ，観測をポイントの位置を決定するために使用したい場合，チェックとして有効にします。ポイントの位置を決定するために観測を使用したくない場合(例えば，観測に環閉合較差がある場合)，無効にします。

再計算レポートは，チェックとして有効な観測は出力しますが，無効な観測は出力しません。

網平均で使用

選択された観測を網平均(網平均モジュールをインストールしている場合)に使用したくない場合，このチェックボックスをクリアします。しかし，データベースが再計算される場合には使用されます。


プロパティウィンドウ　－　測量タブ　－　観測統計ページ(方位角観測)

観測統計ページは，選択された観測タイプに従って適切な解の統計と質インジケータを表示します。方位角観測の場合，標準誤差が表示されます。このページを使用して，解の質をチェックします。

このページを呼び出すには，プロパティウィンドウから、

測量タブの観測統計メニューボタン [image] をクリックします。

標準誤差

このフィールドを使用して方位角観測の標準誤差を入力します。

ノート： 0°00'00� の標準誤差は，網平均で方位角を固定します。


プロパティウィンドウの座標

Trimble Geomatics Office は，プロパティウィンドウで座標追加ボタン [image] を使用することによりポイントの座標を追加できます。このボタンをクリックすると，ショートカットメニューが表示されます。このメニューから，追加したい座標のタイプ，つまりWGS-84，グリッド，ローカルのいずれかを選択します。ポイントに保存された座標，および座標のソースはプロパティウィンドウの左側の系図リストに表示されます。

ポイントに入力できる座標の数は限られています。各ポイントに1つのWGS-84 座標，1つのグリッド/ローカル座標を入力できるだけです。既にWGS-84 座標を追加している場合，WGS-84 オプションは使用できなくなります。

観測の代わりにその座標を使用したい場合のみ，座標を追加してください。なぜなら，再計算は同じ質の観測よりもキー入力された座標を優先して使用するからです。これは設計ポイントが杭打ちポイントに優先して使用されることを保証します。

ノート：接頭文字が入力された座標の名前に付加され，座標がグリッド(G)，ローカル(L)，WGS-84(W)のいずれかを表わします。

追加座標がTrimble Geomatics Office で作成され，ポイントに保存されることもあります。これらの座標は以下を含みます。

網平均から求められた座標

キャリブレーションに保存された調整されたWGS-84 座標

座標を追加するとき，座標成分はヌル(?)で表示されます。現在の値挿入ボタン [image] を使用して，各座標成分フィールドを概要ページに表示されている座標成分の現在の値と質で埋めます。このボタンは埋めたい座標成分フィールドを選択しているときのみ，使用できます。

座標を編集する

入力した座標を編集することができます。しかし，網平均座標やキャリブレーション座標のような，ソフトウェアが作成する追加座標は編集できません。

現在の表示が保存されている座標タイプの設定と同じ場合のみ，座標成分を編集することができます。座標成分が編集されるとき，ソースはオフィスで入力，または成分のいくつかだけが編集された場合はマルチソースに変更されます。

マルチソースからの座標

座標のソースがプロパティウィンドウに表示されます。座標が2つ以上のソースから求められた場合，マルチソースと表示されます。例えば，ポイントの水平座標はインポートファイルから求められ，高度はTrimble Geomatics Office で入力された場合，そのポイントはマルチソースから求められた座標をもつと表示されます。

ヒント：座標ページで各座標成分のソースをチェックするために座標ページでツールヒントを使用できます。

座標を移動する

座標がTrimble Geomatics Office で移動，または変換される時，すべての観測は無効にされます。従って，これらの座標をまた使用したい場合，再度，有効にしてください。これを行うには，マルチ編集ダイアログを使用します。

座標を削除する

座標を削除するには，削除ボタン [image] を使用します。

ノート：網平均で固定された座標は編集できません。

座標の質

プロパティウィンドウで表示される各座標には割り当てられた座標の質があります。下の座標の質を編集できます。

基準点の質

測量の質

マッピングの質

不明の質

固定された基準点の質は変更できません。


プロパティウィンドウ　－　測量タブ　－　イベントページ

プロパティウィンドウの測量タブを使用してイベントデータを表示します。

このページを呼び出すには，プロパティウィンドウから、

測量タブのイベントメニューボタン [image] をクリックします。

プロパティウィンドウ

受信機イベントID

このフィールドはイベントのID を表示します。

補間方法

このフィールドは補間方法が1次式か2次式か表示します。

フィットさせるポイント

このフィールドは円弧補間の適合に使用されているポイントの数を表示します。

受信機ポート ID

このフィールドは受信機のポートID を表示します。

解のタイプ

このフィールドは解のタイプを表示します。

RMS

RMSの値を表示します。

ステータス

このリストから，観測に設定したいステータスを選択します。このステータスは再計算，または測量計算が行われる時に判断されます。


プロパティウィンドウ　-　ステーションとオフセット タブ
プロパティウィンドウ　‐　ステーションとオフセットタブ

ステーションとオフセットタブは､Trimble 装置内のステーションとオフセットプログラムを使用して測定されたポイントに関する情報を表示します。

プロパティウィンドウから、

1.	ステーションとオフセットタブを選択します。

2.	ステーションとオフセットボタンをクリックします｡

名称

このフィールドは線形特徴の名前を含みます。

ステーション

このフィールドは測定されたポイントに対する線形特徴上のステーションを含みます。

ノート:Trimble 3300 機器に対しては、基準ラインから使用された建設オフセットがある場合には、そのオフセットはラインの始点と終点の名前と一緒に名前フィールドに表示されます。

オフセット

このフィールドは測定されたポイントに対する線形特徴からのオフセットを含みます。

デルタ標高

このフィールドは測定されたポイントに対する線形特徴とステーション間の標高差を含みます。


GPS サイトキャリブレ-ション-概要
GPS サイトキャリブレーション－概要

詳細情報

利用方法	ダイアログ
概要

GPS サイトキャリブレーションは，GPS 受信機で収集されたWGS-84 データと(平均海面上の標高でローカル地図グリッドで表わされた)ローカルの基準座標間の関係を確立します。この関係は，一連の数学的変換で定義されます。GPS サイトキャリブレーションの機能で，GPS とキャリブレーションに使用されるローカルの基準点を組にします(GPS 座標は必ずGPS ポイントと観測から求められ，グリッドポイントは必ずグリッドポイントと一般測量機観測から求められなければなりません)。そして，Trimble Geomatics Office は最小自乗法を使用して数学的変換を計算し，適用します。いつでも再キャリブレートできます。

WGS-84 の位置をグリッド座標に変換するために適用される数学的変換は：

1.	測地系変換。WGS-84 緯度，経度，楕円体高の座標をローカル地図グリッドの楕円体への緯度，経度，楕円体高の座標に変換します。

2.	地図投影。ローカル楕円体の緯度，経度の座標をローカル地図グリッドの北距，東距の座標に変換します(高度はこの処理では変換されません)。

3.	WGS-84 へのジオイドモデル。平均海面高上のおおよその標高を求めます。

4.	平面調整。変換されたグリッド座標を最適なローカルデータに調整します。この調整は，全体的な測地系変換では提供できない，投影システムのローカルな変化量を補正します。

5.	高度調整。ローカル楕円体上の高度，または海面高上のローカル基準標高へのジオイドモデルから求められた標高を変換します。

(許されるもっとも大きな残差を定義する)キャリブレーション設定を変更するには，コンピュータのレジストリを使用します。

上の平面，および高度調整は，プロジェクトの座標系定義の一部として保存されます。データベース内のすべてのGPS ポイントはキャリブレーションパラメータを使用して更新され，より精度の高いローカルグリッド座標の値になります。

(キャリブレーションパラメータを含む)新しい座標系定義を同じ地域の今後のプロジェクトで使用するためにサイトとして保存するには，キャリブレーションダイアログから名前を付けて保存をクリックします。

キャリブレーションを他のプロジェクトで使用する目的でサイトとして保存する場合，プロジェクトの地域がキャリブレーションで使用されたポイントで完全に囲まれていることを確認してください。例えば，下の図でサイト定義をプロジェクトB に使用できますが，プロジェクトC には使用できません。

Trimble Survey Controller でリアルタイムキネマティック(RTK )の基準局を [image] キーを使用して始め，Survey Controller (.dc )ファイルをTrimble Geomatics Office に転送した場合，基準位置(および，基準局からのすべての移動ポイント)は不明の質(すべての成分，水平，高度，標高)です。

GPS サイトキャリブレーションがポイントの質を向上したことに信頼性がある場合，プロパティウィンドウを使用して基準ポイントの質を変更します。

ノート：GPS サイトキャリブレーションをWGS-84 座標のRTK 基準局ポイントを使用して行った場合，標準ではそのポイントのグリッド座標は無効になります。しかし，GPS サイトキャリブレーションにグリッド位置を使用できます。これを選択した場合，グリッド座標を有効にし(WGS-84 座標より高い質であることを確認してください)，ポイントをデータタイプごとに分割し､再キャリブレートする必要があります。これを行わず，GPS ベクトルがグリッド位置から伸びている場合､

基準局から求められたすべてのGPS ポイントはキャリブレーションに使用できません。

キャリブレーション残差の評価エラーが発生する可能性があります。

ノート：GPS サイトキャリブレーションを行ない，ローカルサイト設定ダイアログの地表座標を使用チェックボックスを選択している場合，プロジェクトに定義されているキャリブレーションは無効になります。操作を続けるとキャリブレーションが除外されることを警告するエラーメッセージが表示されます。

ジオイドモデルの使用

プロジェクトの座標系がポイントの標高決定にジオイドモデルの使用を定義している場合，標高はWGS-84 の高度をジオイドモデルグリッドの補間で直接変換して決定されます。しかし，大きい縮尺のジオイドモデルが換算できない小さなローカルな変化量を補正するため，ジオイドモデルにより作成された標高のその上にさらに高度調整を適用することが可能です。垂直キャリブレーションから決定された標高は，測量の質になります。

便利なキャリブレーションを保証する規則

WGS-84 座標は相対的に補正されている必要があります。

単独測位のGPS 位置を生成することが可能です。しかし，キャリブレーションで2つ以上の単独測位のWGS-84 ポイントを使用すべきではありません，例えば [image] キーを使用して設定された基準局はTrimble Survey Controller に1つだけにしてください。他の基準局は，単独測位の基準局からのGPS ベクトルで測定された位置に設置すべきです。これは，それらの関係を定義し，どちらの基準局からのポイントを使用してもキャリブレーションが正しく行えます。これは，下のように説明されます。

下の図は基準局間に関係がないことを表わしています。

基準局1 からのポイントと基準局2 からのポイントをキャリブレーションに使用すべきではありません。

下の図には，最初の基準局を使用して観測された2番目の基準局によって基準局間の関係が定義されています。

基準局1 からのポイントと基準局2 からのポイントをキャリブレーションに使用できます。

考えられる最適なWGS-84 座標が測量の最初の基準局に使用されるべきです。

GPS ベクトル(リアルタイム，または後処理)の精度は基準局座標の精度に影響されます。基準局座標の10メートルの誤差ごと10万分の1(1ppm )の誤差まで発生する可能性があります。例えば，最初のWGS-84 基準点に100メートルの誤差があり，基線が2キロメートルの場合，GPS ベクトルには2センチメートルの不要な追加誤差があるかもしれません。


レジストリを使用してキャリブレーション設定の変更をする

概要と詳細

Trimble Geomatics Office がインストールされるとき，コンピュータコントロールにレジストリ設定が追加されます。

キャリブレーションパラメータの最小自乗計算時に行われる反復回数

キャリブレーションポイントのキャリブレートされた位置と既知の位置間の許される最大誤差

エントリを使用して，警告が表示される場合を制御できます。警告は，計算が指定された最大誤差の判断基準を満たさなかったことを意味します。

レジストリ エントリ

エントリ(Maximum Error とMaximum Iteration Count )はレジストリキーの下にあります。

HKEY_CURRENT_USER\Software\Trimble\Trimble Geomatics Office\1.6\Calibration

Maximum Error(最大誤差)

最大誤差を変更するには，このエントリを使用します。値は，キャリブレーションポイントの計算された座標とそれに割り当てられた既知のグリッド座標の最大の水平極誤差(残差)です。

この指定された誤差を超えた場合，キャリブレーション計算が定義された最大水平残差を超えたことを示すエラーメッセージが表示されます。

キャリブレーションの結果は下の状態の場合，指定された最大誤差を超えると考えられます。

グリッド基準局の入力にエラーがあった

基準点が誤って定義された，または測量中に誤って固定された

キャリブレーション計算が指定された反復回数ないに収束しなかった

Maximum Error フィールドの値が小さいほど，最大誤差を超えたというメッセージを受け取る可能性は大きくなります。これは，計算された位置と既知の位置の一致の厳しい判断基準が定義されたためです。

このフィールドの標準の値(常にメートルで定義されます)は0.1mです。

Maximum Iteration Count(最大反復回数)

最大反復回数を変更するには，このエントリを使用します。キャリブレーションパラメータの最小自乗計算が行われる反復の最大回数を制御します。この値に大きい数字を設定するほど，計算が計算されたパラメータが繰り返すごとに変化しなくなるまで，計算がさらに繰り返されます。

この値の有効範囲は5 から5000 です。5 より小さい値を設定した場合，最小の値5 が使用されます。5000 より大きい値を設定した場合，最大の値5000 反復が使用されます。標準の反復回数は10 です。


GPS サイトキャリブレーションコマンド

このコマンドを使用してGPS サイトキャリブレーションを実行します。

このコマンドを呼び出すには，測量/GPS サイトキャリブレーションを選択します。

GPS サイトキャリブレーションダイアログが表示されます。

ノート：GPS サイトキャリブレーションダイアログが表示される前に，網平均変換パラメータが定義されている場合，GPS サイトキャリブレーションが行われた時にそれらは破棄されます。結合された同じ名前のポイントがある場合，ポイントをデータタイプごとに分割するか確認するメッセージが表示されます。


GPS サイトキャリブレーションダイアログ

概要と詳細

このダイアログを使用して，サイトキャリブレーションを行います。

このダイアログを呼び出すには，測量/GPS サイトキャリブレーションを選択します。

GPS サイトキャリブレーションを行うには､

1.	どのキャリブレーション要素を計算するか指定します。

2.	座標の組のリストを定義します。1組は物理的に同じポイントへのグリッドから求められた位置とGPS から求められた位置です。

3.	現在のキャリブレーションをデータベースに適用します。

キャリブレーション要素

キャリブレーション要素グループには下のチェックボックスとフィールドがあります。

測地系変換

一般に，事前に定義された測地系変換が座標系定義の一部として使用できます。この測地系変換は3パラメータ，7パラメータ，multiple regression，または測地グリッドファイル(例えば，NADCON )をベースにするかもしれません。この場合，他の測地系変換を計算する必要はなく，測地系変換チェックボックスはクリアにしておきます。しかし，測地系変換の情報がなかったり，何らかの理由でパラメータが疑わしい場合，測地系変換を計算します。

プロジェクトの座標系定義の一部としてWGS-84 楕円体とローカル楕円体間の測地系変換を計算するには，このチェックボックスを選択します。3パラメータ変換と7パラメータ変換オプションが使用できます。どちらのタイプの測地系変換を計算するか選択します。

ノート：このオプションは標準(横メルカトール)投影の座標系が設定されているプロジェクトには使用できません。標準投影は直接，WGS-84 楕円体をベースにしており，つまり測地系変換が不要だからです。

測地系変換が計算され，キャリブレーションがデータベースに適用される場合，プロジェクトプロパティダイアログの座標系タブの測地系フィールドは�キャリブレーション�と表示されます。

標準のプロジェクト原点を更新

このオプションは現在の座標系定義が標準投影を使用している場合にのみ，使用可能です。ポイントリストの最初の2次元の基準点を使用して投影原点を更新するには，このオプションを使用します。標準投影には偽北距・偽東距が定義されている緯度・経度原点がないので，原点を更新することはプロジェクトの原点がローカルであることを裏付けます(つまり，プロジェクト測量データをローカルに近づけます)。

標準投影が定義されているプロジェクトにGPS サイトキャリブレーションを行う場合，このチェックボックスがクリアされていることを確認してください。そうすれば，標準の投影定義は変更されません。

平面調整

平面調整を計算するには，このオプションを選択します。縮尺係数を1に設定チェックボックスが使用可能になります。距離を縮尺したくない場合，このオプションを使用して縮尺係数を1に設定します。平面調整は平面の変換で，南北および東西の方向の変換と，定義された原点の周りの回転と，縮尺係数を含みます。変換パラメータは最小自乗法を使用して計算され，GPS の位置に適用した時に基準グリッド座標に最適にフィットする調整パラメータの変換を探します。

平面調整は基準座標とGPS の位置から計算されたグリッド座標間の残差誤差を減らします。

ヒント：一般に，計算された縮尺係数が1に近いかどうか確認するため，はじめは縮尺係数を1に設定しないで平面調整を計算するのが懸命です。計算された縮尺係数が1に近くない場合，これは選択されたキャリブレーションポイントの組に問題があることを示唆します。

高度調整

高度調整を計算するには，このオプションを選択します。これは傾斜面調整で，定義された原点での高度のシフトと，北および東の方向傾斜を含みます。この調整のパラメータは最小自乗法を使用して計算され，GPS の高度から求められた標高が基準点の標高に最適にフィットする調整面を探します。これには，3つの3次元キャリブレーションポイントの組が必要です。1つの3次元キャリブレーションポイントの組では高度のシフトパラメータだけが計算されます。2つの3次元キャリブレーションポイントの組が使用できる場合，システムはこれら2つの組に正確にフィットする補正面を定義します。

プロジェクトがジオイドモデルを使用する場合，高度調整はジオイドモデル補正のその上に計算され，適用されます。

ジオイドモデル

ジオイドモデルフィールドは座標系定義の一部として選択されているジオイドモデルの名前を表示します。ジオイドモデルがない場合，�なし�が表示されます。これは，表示のみのフィールドです。ジオイドモデルの設定はプロジェクトプロパティダイアログの座標系タブを使用してのみ，変更できます。

ポイントリスト

ポイントリストをクリックして，キャリブレーション計算で使用されるキャリブレーションポイントの組を選択します。GPS サイトキャリブレーションダイアログは消え，ポイントリストダイアログが表示されます。

計算サマリー

このグループのフィールドに最後に行われたキャリブレーション計算の概要が表示されます。サマリーを使用して，計算レポートを見ることなく，計算されたキャリブレーションが有効か確認します。

平面調整縮尺係数

平面調整縮尺係数フィールドは，平面調整に計算された縮尺係数を表示します。縮尺係数を1に設定を選択していた場合，このフィールドは1を表示します。このフィールドを使用して，計算された縮尺係数が1に近いか，確認します。近くない場合，これは1つ以上のキャリブレーションポイントの組に問題があることを示唆します。

最大高度調整傾斜角

最大高度調整傾斜角フィールドは，計算された北方向の傾斜と東方向の傾斜の値を元に，計算された高度調整の最大傾斜角を表示します。

最大水平残差  と  最大垂直残差

最大水平残差と最大垂直残差のフィールドは，最後に行われた計算の最大残差を表示します。

OK

OKをクリックして，最後に計算されたキャリブレーションをデータベースに適用します。

再計算が行われ，すべてのGPS の位置がGPS キャリブレーションに従って更新されることを確認します。座標系の詳細は，キャリブレーションパラメータで更新されます。

キャリブレーションの詳細を表示するには：

1.	ファイル/プロジェクトプロパティを選択します。

2.	座標系タブを選択します。

3.	詳細をクリックします。

4.	平面調整タブ，または高度調整タブを選択します。

取消

取消をクリックして，計算されたキャリブレーションを適用しないでGPS サイトキャリブレーションダイアログを終了します。

計算

計算をクリックして，キャリブレーション要素の設定変更後のGPS キャリブレーションパラメータを計算します。計算が行われると，計算サマリーフィールドに結果が表示されます。

サイトに名前をつけて保存

サイトに名前をつけて保存をクリックして，現在のキャリブレーションと座標系の詳細を座標系データベースにサイト定義として保存します。サイトに名前をつけて保存ダイアログが表示されます。保存するサイト定義の名前を入力し，OKをクリックします。このサイト定義を今後のプロジェクトの座標系定義として使用できます。

座標系

座標系をクリックして，プロジェクトの現在の座標系の詳細を表示します。ファイル/プロジェクトプロパティ/座標系タブの座標系詳細ダイアログと同じダイアログが表示されます。

レポート

レポートをクリックして，キャリブレーション計算の詳細なレポートを表示します。このレポートは計算された基準点座標とその既知の位置の比較と各残差のリスト，およびすべての計算されたパラメータを表示します。


GPS サイトキャリブレーション　－　ポイントリストダイアログ

このダイアログを使用して，GPS サイトキャリブレーションパラメータの計算に使用したいキャリブレーションポイントの組を選択します。

このダイアログを呼び出すには：

1.	測量/GPS サイトキャリブレーションを選択します。GPS サイトキャリブレーションダイアログが表示されます。

2.	ポイントリストをクリックします。

GPS サイトキャリブレーション�ポイントリストダイアログが表示されます。

このダイアログにはキャリブレーションポイントの組のグループのスクロールリストがあります。キャリブレーションの計算に定義される組の数に制限はありません。より多くの組を追加することが常にキャリブレーションの結果を向上させる訳ではありませんが，計算されたパラメータの確認のチェックが増えます。

各キャリブレーションポイントの組には，1つのGPS ポイント(GPS 位置のポイント，またはGPS べクトルから求められたポイント)とGPS から求めたのでない1つのグリッドポイント(通常，基準点，または網平均されたポイント，または一般測量機観測から求められたポイント)があります。

ノート：GPS ポイントはWGS-84 座標から伸びるGPS ベクトルから求められたはずです。グリッド座標から伸びるGPS ベクトルは，GPS ポイントを定義するために使用できません。

ポイントリストに追加するポイントを選択，指定すると，システムは各GPS ポイントに実際にGPS から求めた座標があるか，各グリッドポイントにGPS から求めたのではない座標があるかチェックします。

キャリブレーションポイントの組の位置はグラフィックウィンドウでハイライトされます。GPS ポイントは四角で，基準点は十字でハイライトされ，2つの位置の間はラインで結ばれます。キャリブレーションポイントの組の1つの詳細を見るためには，これを拡大する必要があります。ポイントリストの現在のキャリブレーションポイントの組の記号と結合ラインが点線で表示されます。

通常，キャリブレーションポイントの組のポイントを選択するために，グラフィックウィンドウから適切なポイントをクリックして埋めたフィールドを使用します。位置をクリックしてフィールドを埋める場合，GPS から求められたポイントはGPS ポイントとしてのみ選択され，GPS から求められていないポイントはグリッドポイントとしてのみ選択されます。GPS ポイント，グリッドポイントのフィールドに使用したいポイントの名前を入力することもできます。

使用される(GPS 高度とジオイドモデルから求められたのではない)グリッド標高のあるGPS ポイントがある場合，垂直調整の計算において同じポイントをGPS ポイントとグリッドポイントの両方に使用できます。これを行う場合，タイプフィールドは垂直に設定されます。

ノート：2つの別々のポイント(GPS ポイントとグリッドポイント)が同じ名前である場合，GPS ポイントが選択されたとき，同じ名前のグリッドポイントが自動的に選択されます。GPS とグリッドの座標が同じポイントに保存されている場合，ポイントをタイプごとに分割.する必要があります。

データベースに適当なグリッドの基準点もGPS ポイントもない場合，現場で提供された適当な座標値を指定することができます。この場合，Trimble Geomatics Office のデータベースにあると思われるポイントの名前をポイント名に指定してはいけません。この方法で入力される位置はデータベースに保存されません。

キャリブレーションの座標値(GPS またはグリッドポイント)を指定するには：

1.	名前フィールドのGPS ポイント，またはグリッドポイントの隣りのプラス(+)アイコンをクリックします。

ツリー表示が広げられ，座標フィールドが表示されます。

2.	位置をクリックしてフィールドを埋めるか，キーボードから値を入力して座標フィールドを完成します。

GPS サイトキャリブレーションで使用するGPS ポイントを選択できない場合，GPS サイトキャリブレーションのポイント選択に伴う問題トピックをご覧ください。

タイプ

キャリブレーションポイントの組がキャリブレーション計算でどのように使用されるか指定するには，このフィールドを使用します。座標の組を選択すると，Trimble Geomatics Office は自動的にこのフィールドを適切なタイプで設定します。選択したオプションが有効であるタイプに変更できます。例えば，基準点に標高がない場合，その組のタイプフィールドを水平垂直には設定できません。

使用できるオプションは：

水平垂直－このオプションはキャリブレーションポイントの組が水平，垂直両方の調整を決定するのに使用されるのが適当であることを指定します。

水平－このオプションはキャリブレーションポイントの組が水平の調整を決定するのにだけ使用されるのが適当であることを指定します。実際にグリッドポイントの標高の値は信頼できません。

垂直－このオプションはキャリブレーションポイントの組が垂直の調整を決定するのにだけ使用されるのが適当であることを指定します。実際にグリッドポイントの北距・東距の値は信頼できません。

(無視)－このオプションはキャリブレーションポイントの組が変換パラメータの計算に一切，使用されないことを指定します。これは，キャリブレーション計算に問題を発見し，疑わしいキャリブレーションポイントの組を探すのに便利です。この設定を使用して，キャリブレーションポイントの組を一時的に計算から外し，結果が向上するかどうかを確認します。

(無効)－このオプションは，選択したポイントの組が有効なポイントの組でないことを表示します。

統計

このグループのフィールドは，ポイントリストに追加した値をベースにしたキャリブレーションの結果を表示します。サマリーを使用して，キャリブレーションの統計をチェックし，ポイントリストを確定する前に悪いポイントの組を特定します。

平面調整縮尺係数

水平調整縮尺係数フィールドは計算された平面調整の縮尺係数を表示します。縮尺係数を1に設定チェックボックスを選択した場合，このフィールドは�1�を表示します。このフィールドを使用して，計算された縮尺係数が1に近いか確認します。1に近くない場合，これはキャリブレーションポイントの組の1つ以上に問題があることを示唆します。

最大高度調整傾斜角

最大高度調整傾斜角フィールドには，計算された北方向の傾斜と東方向の傾斜の値を元に計算された高度調整の最大傾斜角が表示されます。

最大水平残差  と  最大垂直残差

最大水平残差と最大垂直残差フィールドは最大残差を表示します。

挿入

挿入をクリックして，空のキャリブレーションポイントの組のレコードを挿入します。これは，標準投影を使用している場合で投影原点を更新したい場合に便利です。最初のポイントの組は原点の更新に使用されます，従ってこのボタンを使用して新しい空のキャリブレーションポイントの組をリストの最初に挿入します。

削除

削除をクリックしてキャリブレーションポイントの組をリストから除外します。


GPS サイトキャリブレーションのポイント選択に伴う問題

GPS サイトキャリブレーション�ポイントリストダイアログを使用してGPS サイトキャリブレーションのポイントを選択します。システムはキャリブレーションポイントの組のGPS ポイント，またはグリッドポイントのポイントを選択しません：

GPS ポイントが選択できません。始点はグリッドから求められています。

ポイントは，ベクトルの�始点�がグリッド位置から求められたベクトルの結果です。これは，リアルタイムキネマティック(RTK )測量の後で，基準局のグリッド位置をキー入力した場合に起きます。基準局から伸びるすべてのベクトルに適用されます。しかし，これらのうちいくつかのポイントの位置はWGS-84 の値(ベクトル)とグリッドの値(基準局のWGS-84 位置)の組み合わせを使用して求められます。基準局からのベクトルが適用されたベクトルのあるポイントは一切，使用できません。これは下の図で説明されます。

ポイント1 はGPS サイトキャリブレーションのGPS ポイントとして使用できません。

基準局のグリッド位置がWGS-84 に変換され，ベクトルがポイント1 の位置に適用されています。

ポイント1 はGPS サイトキャリブレーションのGPS ポイントとして使用できます。

ベクトルにWGS-84 の位置が適用され，ポイント1 の位置が決定されています。

これを解決するには，プロパティウィンドウを使用してポイントの座標を編集し，WGS-84 の位置を入力します。これはグリッド位置より優先して使用され，基準局から伸びるすべてのベクトルはGPS キャリブレーションのGPS ポイントとして使用できます。

�始点�がグリッドの位置から求められたためにGPS ポイントに選択できないのと同様に，�始点�がGPS の位置から求められた場合，グリッドポイントに使用できません。グリッドポイントは一般測量機観測が起点になっている必要があります。


3パラメータ変換

定義された座標系がなく，プロジェクトの地域に独自の測地系変換パラメータを作成したい場合，GPS サイトキャリブレーションを使用して測地系変換を定義します。

3パラメータ変換アルゴリズムは，WGS-84 楕円体の中心からローカル投影の楕円体の中心へのX，Y，Z 地心座標軸に沿った移動量を計算します。基準点の位置は，ローカル楕円体の空間位置，つまりWGS-84 楕円体との関係を決定するのに使用されます。


7パラメータ変換

定義された座標系がなく，プロジェクトの地域に独自の測地系変換パラメータを作成したい場合，GPS サイトキャリブレーションを使用して測地系変換を定義します。

7パラメータ変換アルゴリズムは，3つの移動量，3つの回転量，縮尺を計算します。それらはWGS-84 楕円体からローカル投影の楕円体の間の変更を行ないます。基準点の位置は，ローカル楕円体の空間位置，つまりWGS-84 楕円体との関係を決定するのに使用されます。3つの移動量は3パラメータ変換と同様に，WGS-84 楕円体の中心からローカル投影の楕円体の中心へのX，Y，Z 地心座標軸に沿って計算されます。各軸についての2つの楕円体間の回転を計算し，縮尺係数で2つの楕円体間のサイズの違い(楕円体の長半径と扁平度の違いに起因する)を補正します。

基準点の位置は，ローカル楕円体の空間位置，つまりWGS-84 楕円体との関係を決定するのに使用されます。計算された移動量と回転量には緊密な相関関係があります(つまり，地球の半径ような大きい半径全体に適用された非常に小さい回転角の結果は，移動と非常に似ているということ)。これは，基準点が充分に大きな地域をカバーしていない場合，おおざっぱな変換をする正確でない計算値が容易に得られることを意味します。通常，7パラメータはおよそ8km四方の範囲をカバーする基準点がない限り，計算すべきではありません。しかも，計算された回転量は円弧の10°を超えてはいけません。


GPS 観測ｰ概要
GPS 観測　－　概要

関連項目

GPS 観測，または基線は，GPSを使用して観測された2点間のベクトルです。基線を決定する2点は使用された測量技術に依存します。例えば，リアルタイムキネマティック(RTK )測量，または後処理キネマティック(PPK )測量において，基線は基準局から各移動ポイントへ存在します。

しかし，静止測量や高速静止測量では基準局はありません。これらの測量技術では，GPS ベクトルは下の表が示すように，同時に観測されたポイント間に存在します。

基線タイプを表示するには，基線を選択しプロパティウィンドウを開きます。

静止，高速静止，後処理キネマティック(PPK )のベクトル

後処理されていない静止，高速静止，PPK 観測は未解析の基線です。基線が後処理されると，それらは後処理された基線になります。

後処理された基線を削除すると，基線は考えられる(潜在的な)基線に戻ります。ポイントを削除することにより基線を除外できます。または，今後の測量計算に使用したくないがポイントは保存したい場合，基線を無効にすることができます。

PPK 連続ベクトル

PPK 連続ベクトルが後処理された場合，PPK 基線を同じ色で表示されます。しかし，プロパティウィンドウの解析タイプは�連続�と表示されます。

RTK ベクトル

RTK ベクトルは考えられる基線になりません。プロパティウィンドウには迭TK 基線�として表示されます。連続RTK ベクトルはRTK 基線と同じ色で表示されます。しかし，プロパティウィンドウの解析タイプは�連続�と表示されます。

チェックベクトル

基線のステータスが�チェック�に設定されている場合，基線は点線で表示されます。

無効なベクトル

基線のステータスが�無効�に設定されている場合，無効な基線の色で表示されます。


GPS 観測

GPS 観測レコードはGPS を使用してポイントが観測されるごとに作成されます。

プロパティウィンドウを使用してGPS 観測レコードを表示するには：

1.	下の1つを選択します。

GPS を使用して観測したポイント

基線(測量画面で)

2.	アイコンをクリックして，GPS 観測レコードを表示します。

プロパティウィンドウでGPS を使用して観測したポイントを選択している場合，そのポイントのすべてのGPS 観測レコードを表示できます。プロパティウィンドウを使用して基線を選択している場合，生成された基線のGPS 観測を表示できます。

GPS 観測レコードには下の内容が含まれます。

ポイント名。

観測の長さ(時間)と観測の開始時刻。

アンテナ高，アンテナタイプ，測定方法を含むGPS アンテナの詳細。

データインポート時，開始時刻と終了時刻はGPS 時刻からUTC(協定世界時�事実上，グリニッジ標準時)に変換されます。それから時刻はMicrosoft Windows のタイムゾーン設定を使用して現地時刻で表示されます。


プリズム定数

プリズム定数はトータルステーションで測定された斜距離への補正値です。再計算時に適用されます。プリズム反射面が測定される測量ポイントの上に直接あるわけではないので，これが必要になります。定数は通常，マイナスの値です。

記号の意味

	補正された斜距離
	測定された斜距離
	プリズム定数

プリズム定数の値はターゲット設置情報と共に保存されます。

プリズム定数の値を表示，編集するには：

1.	ターゲット設置ポイント､または一般測量機観測を選択します。

2.	プロパティウィンドウを開きます。

ボタンをクリックします。

ノート:3300/3600/5600 Elta と3600/5600 GDM ソフトウェアでは、プリズム定数が機器に適用されますが、ファイルには保存されません。プリズム定数は'?'と表示されます。

機器に設定されているプリズム定数が不正であり、Trimble Geomatics Office でその値を補正したい場合には、プロパティウィンドウのプリズム定数フィールドに不正なプリズム定数と正しいものの差を入力します。例えば､プリズム定数を�20�と入力したけれども、正しくは�5�の場合には、当15�と入力します。

ヒント：マルチ編集ダイアログを使用して複数の観測を編集できます。


電磁波距儀(EDM )の取り付け偏心補正

電磁波距儀(EDM )の測定経路は望遠鏡の視準線と同時に起きるので，最も近代的なトータルステーションは取り付け偏心補正を必要としません。この補正は，EDM に取り付けられた望遠鏡が，反射鏡/ターゲットがEDM /望遠鏡の設置に一致するよう設計されている傾斜反射鏡と共に使用される場合，必要ありません。

しかし，ある場合には測定された斜距離への補正を計算して，望遠鏡の視準線と同時に起きたをEDM 測定経路を持つ，観測したかった真の斜距離を見つける必要があるかもしれません。取り付け偏心補正は取り付けのシステムに依存し，Trimble Geomatics Office により，下に示す適切な方程式が使用され自動的に適用されます。

適切なオフセットの値が装置ファイルの機器レコードに保存されます。

1.標準取り付けされた傾斜反射鏡のないEDM

記号の意味

	補正された斜距離
	EDM オフセット(機器)
	EDM オフセット(機器)
	天頂高度角(観測された)
	測定された斜距離(プリズム定数補正適用後)

2.望遠鏡が取り付けられた傾斜反射鏡のないEDM

記号の意味

	補正された斜距離
	EDM オフセット(機器)
	EDM オフセット(機器)
	天頂高度角(観測された)
	測定された斜距離
この補正は装置ファイルのインポート時に適用されます。


気圧・気温の補正

気圧・気温の補正は，電気的に測定された距離に行われます。測定された長さに存在する，気温と気圧のために起きる変化量を補正します。現場作業中に適切な値を入力したり，インポート前に装置ファイルを編集したりできます。

EDM によって測定された電気的な距離の測定は，空気中を通る光のスピードを基本にしています。気温と気圧はこのスピードに影響します。

EDM に適切な補正がまだ適用されていない場合，この気象補正は距離の測定にのみ行われます。

記号の意味

	補正された斜距離
	測定された斜距離
	EDM 機器固有の搬送波周波数，および変調周波数の屈折率インデックス
	EDM 機器の搬送波位相の長さへの定数(mm Hg )
	単位の大気圧( mm Hg )
	乾球温度(℃)

ノート：Trimble はTrimble Survey Controller で気圧・気象補正を記録することをお勧めします。この補正は.dc ファイルインポート時に斜距離に適用されます。

ノート：3600/5600 Zeiss Elta と3600/5600 GDM、TDS Survey Pro ソフトウェアでは、気圧と気温の補正は機器に適用されます。そのために、Trimble Geomatics Office にインポートされた時点で観測はすでに補正されています。


視準軸基準

視準軸基準補正は角度の補正で，高度角に直接適用されます。

機器の視準軸基準補正値は望遠鏡の正反両方を使用した対象への注意深い観測により確定されます。確定された補正値は望遠鏡のヘア交点のわずかな位置誤差による定数誤差を示唆します。

機器の軸誤差補正値が確定されると，装置ファイルに軸誤差補正値レコードが保存され，視準軸基準補正値が下のすべての高度角に適用されます。

正：
反：
記号の意味

	補正された高度角
	観測された高度角( 天頂角 )
	視準軸基準の補正値。この補正値は装置ファイルのインポート時に適用されます。

ノート：Trimble Survey Controller には基準補正のプログラムはありません。インポート中に基準補正は行われません。

ノート：3300/3600/5600 Eltaと3600/5600 GDM、TDS Survey Pro ソフトウェアでは、Trimble Geomatics Office にインポートされる前に視準軸基準が適用されます。


曲率と屈折率

曲率と屈折率の補正は観測された高度角に行われ，地球の曲率や光路の大気垂直屈折率による影響を補正します。

記号の意味

	補正された天頂高度角
	観測された天頂高度角
	補正された斜距離
	屈折係数�一般に，0.142 または0.20，装置ファイルのジョブレコードの値に依存する
	地球の半径

ノート：

このフォーマットはラジアンの値を返します。

曲率と屈折率の補正は、Trimble Survey Controllerファイルのインポート時に適用されます。

3300/3600/5600 Elta ソフトウェアでは、曲率と屈折率の補正は機器内で適用されます。そのために、Trimble Geomatics Office にインポートされる前に観測はすでに補正されています。

3600/5600GDM ソフトウェアでは、曲率と屈折率の補正は計算された座標に適用されます。生の観測がTrimble Geomatics Office にインポートされ補正されます。

TDS Survey Pro ソフトウェアでは、曲率と屈折率の補正はTrimble Geomatics Office へのインポート時に適用されます。


水平軸基準

ノート：Trimble Survey Controller には基準補正のプログラムはありません。インポート中に基準補正は行われません。

基準レコードがあると，Trimble Geomatics Office は水平軸基準補正値を下の式に従って適用します。

正：
反：
記号の意味

	補正された水平角
	観測された水平角
	水平軸基準の補正値

軸誤差補正は，必要な時，装置ファイルのインポート時に適用されます。

ノート：3300/3600/5600 Eltaと3600/5600 GDM、TDS Survey Pro ソフトウェアでは、Trimble Geomatics Office にインポートされる前に水平軸基準が適用されます。


水平の方向

関連項目

一般測量機の水平角は再計算時に後視への方位角により方向を決定されます。水平角は方位角に加算され，結果は前視ポイントへの方位角になります。これはその設置のすべての観測の方向を決定します。

後視ポイントへの方位角は下の規則を使用して決定されます(一般測量機観測のみ)。

器械点と後視ポイントの位置だけが既知の場合(つまり，方位角がキー入力されない場合)，再計算は2点間の逆算から決定される後視方位角を使用します。

キー入力された方位角だけが使用可能で�終点�に座標がない場合，再計算はこれを後視方位角として使用します。

器械点と後視ポイントの両方の位置が既知で，キー入力された方位角が使用可能な場合，再計算は各方位角の質を決定し，下の表の優先順位を使用してどの方位角を後視方位角として使用するか決定します。

例えば，測量の質の器械点と後視ポイントの組があり，基準点の質のキー入力された方位角がある場合，キー入力された方位角が後視方位角に使用されます。

ノート：後視方位角の質を計算するには，器械点と後視ポイントの水平の質を検査し，低いほうの質が採用されます。例えば，器械点は基準点の質で，後視ポイントがマッピングの質の場合，後視方位角はマッピングの質になります。

タイプ	質
座標から求められた	基準点
キー入力された方位角	基準点
座標から求められた	測量
キー入力された方位角	測量
座標から求められた	マッピング
キー入力された方位角	マッピング
ノート：再計算で器械点と後視ポイントから求められた方位角よりキー入力した方位角を使用したい場合，キー入力した方位角の質を器械点と後視ポイントから求められた方位角の質より高い優先順位にしてください。

ヒント：キー入力された方位角の質は編集できます。


水平角

関連項目

一般測量機観測において，Trimble Geomatics Office は方向が決定されていない2点間の水平角を保存します。角度は再計算中に方向付けられます。

インポート時，水平角が下の式によって決定されます。

記号の意味

	Trimble Geomatics Office に保存された水平角
	前視ポイントへの水平観測
	後視ポイントへの水平観測
BSObsの値は装置ファイルのBKB レコードに保存されます。(BKB レコードは後視レコードを持つ.dc ファイルにあるレコードタイプです。)

後視レコードがない場合，Trimble Geomatics Office は最初のポイント観測を後視ポイントとして扱います。


斜距離の変換

概要

各一般測量機観測について，Trimble Geomatics Office は再計算時に斜距離を水平成分と垂直成分に変換します。

下の2つの式が使用されます。

記号の意味

	ソースポイントの標高における水平距離
	ソースポイントとターゲットポイント間の高度の差
	斜距離(観測時の補正後)
	高度角( 天頂 )
変換説明図をご覧ください。図によって上の2つの式で使用されている値が明確になります。


楕円体レベル補正

海面高補正(または，楕円体レベル補正)は計算された水平距離に適用されます。海面高補正が適用されているかどうかを確認するには，ファイル/プロジェクトプロパティ/再計算タブを選択します。

この補正は，水平距離を楕円体レベルで測定された距離に変換します(ジオイド高でなく，海面高)。この差は変換において重要ではありません。

一般測量観測を楕円体上に変換チェックボックスが選択されたいる場合，一般測量機観測はローカル楕円体に沿って適用されます。一般測量観測を楕円体上に変換チェックボックスがクリアされている場合，一般測量機観測は地表に沿って適用されます。

楕円体レベル補正の式は：

記号の意味:

	地球の半径
変換の説明図をご覧ください。図によって上の式で使用されている値が明確になります。

ノート：楕円体レベル補正は縮尺係数のみでは適用されません。縮尺係数のみのファイルをインポートする場合，Trimble Geomatics Office の楕円体レベル補正の設定は自動的にオフになります。(ローカルサイト設定ダイアログの地表座標使用チェックボックスを選択する場合を除く。)


地球の半径

Trimble Geomatics Office において，地球の半径はプロジェクトの緯度とプロジェクトの楕円体を使用して計算されます。標準のプロジェクトの緯度は30度です。例えば，WGS-84 楕円体上のプロジェクトの緯度30度の地球の半径の値は6383 480.917 です。

ノート：一般測量機観測をインポートする前にプロジェクトの緯度を定義してください。一般測量機データのインポート後にプロジェクトの緯度を定義した場合，楕円体補正，曲率・屈折率補正は新しく計算された地球の半径を使用して再適用されません。

プロジェクトの緯度を定義するには、

1.	ファイル/プロジェクトプロパティを選択します。プロジェクトプロパティダイアログが表示されます。

2.	座標系タブを選択します。

3.	ローカルサイト設定グループで変更をクリックします。

4.	プロジェクトの緯度グループで，プロジェクトの緯度を入力します。


一般測量機観測-概要
一般測量機観測　－　概要

Trimble Geomatics Office は、一般測量機器を使用して観測されたポイントをサポートします。これらのポイントを一般測量機観測と言います。

Trimble Geomatics Office で下のことができます。

一般測量機観測のインポート

レーザー測距儀観測のインポート

デジタルレベルファイルのインポート


一般測量機観測の補正

Trimble Geomatics Office の再計算は，距離の測定と観測された角度を使用して，一般測量機で観測されたポイントの座標を計算します。

インポート

インポート時，下の補正が適用されます。

気圧・気温の補正，斜距離への適用

曲率と屈折率，高度角への適用

水平角は､水平観測を後視ポイントからの水平角に変換します。反位の読定を正位の読定として保存します。

電磁波距儀(EDM )の取り付け偏心補正

水平軸基準(.sdr ファイルのみ)

視準軸基準(.sdr ファイルのみ)

再計算

再計算時，下の補正が適用されます。

楕円体補正

水平の方向

プリズム定数


補正説明図

これらの補正において，下の説明図は式で使用されている値を明確にします。

記号の意味

	高度角( 天頂 )
	斜距離(観測時の補正後)
	楕円体上のソースポイントの標高
	ソースポイントとターゲットポイント間の高度の差
	ソースポイントの標高における水平距離
	海面高(または，楕円体上)の弦
	海面高(または，楕円体上)の距離


一般測量機観測 － 正反観測

反位の観測は変換され正位の観測としてデータベースに保存されます。観測を選択するには，プロパティウィンドウを使用します。正位，または反位が表示されます。

同じポイントから/へ正位，反位観測がある場合，正位と反位の観測は平均され，1つの観測としてインポートされます。観測タイプは平均と表示されます。


一般測量機観測－トラバース

Trimble Survey Controller とTDS Survey Pro､3600/5600 Elta ソフトウェアを使用して，一般測量機観測のトラバース閉合較差を計算し，トラバースを調整することができます。

調整したトラバースがあり，調整した値を変更したい場合，下の手順を踏んでください。

1.	座標を変更したいポイントを選択します。

2.	プロパティウィンドウを開き，ツリー使用してポイントを広げます。

3.	ポイントに既にグリッド/ローカル座標があるか確認します。ない場合，座標追加ツール [image] を使用して座標を追加します。

4.	座標フィールドをクリックし，既知座標の値を入力します。

5.	質選択コントロールの横の座標フィールドで，ドロップダウンリストから質オプションを選択します。測量，または観測に使用されているより高い質でなければいけません。

6.	OK をクリックします。

7.	F4 を押して測量データの再計算を行います。

再計算は，既知座標と観測された座標のすべての閉合較差を決定します。

閉合較差は再計算レポートに表示されます。これらの閉合較差を表示したくない場合，観測を無効にしてください。

閉合較差を表示するには，下の1つを行います。

レポート/再計算レポートを選択する。

プロパティウィンドウの警告ページボタン [image] をクリックし，ポイント関連アイコン [image] をクリックする。

プロパティウィンドウの概要ページボタン [image] をクリックし，ポイント関連アイコン [image] をクリックする。


レ-ザ-測距儀観測-概要
レーザー測距儀観測－概要

Trimble Geomatics Office はレーザー測距儀を使用してTrimble Survey Controller  バージョン7.00以降で観測されたポイントをサポートします。Trimble Survey Controller がサポートするレーザー測距儀に関する情報は，Trimble Survey Controller Reference Manual をご覧ください。

レーザー測距儀観測がどのように表示されるかはプロパティウィンドウの表示設定によって決まります。

Trimble Geomatics Office で下のことが行えます。

レーザー測距儀観測を含むSurvey Controller (*.dc)ファイルをインポートする。(観測されたレーザー測距儀ポイントはTrimble Geomatics Office に一般測量機ポイントとまったく同じにインポートされます。)

プロパティウィンドウでレーザー測距儀観測を表示します。

レーザー測距儀観測を選択しレポートします。


レ-ザ-測距儀観測-表示
レーザー測距儀観測－表示

レーザー測距儀観測は測量画面に表示されます。それらが表示される色は，表示/オプション/画面デザインタブの背景設定に依存します。

ヒント：選択/クエリーを選択し，レーザー測距儀ポイントオプションを使用してデータベースのすべてのレーザー測距儀観測を選択します。レーザー測距儀ポイントには，レーザー測距儀観測があります。

レーザー測距儀を使用して観測されたポイントを表示するには：

1.	測量画面でプロパティウィンドウを開きます。

2.	レーザー測距儀観測を選択します。

メニューボタンを使用して下のレーザー測距儀観測の詳細を表示できます。


キャリブレーションと網平均の変換パラメータ

利用方法...

GPS サイトキャリブレーションが実行されると，キャリブレーションパラメータが計算され，データベースのWGS-84 のポイント(GPS ポイント)とローカルグリッド位置間の関係を確定します。

固定して網平均(網平均モジュールをインストールしている場合)が行われると，変換パラメータが計算されます。このパラメータは観測と固定された基準点の間の関係を確定します。

Trimble Geomatics Office はGPS サイトキャリブレーションから求められた平面・高度調整パラメータか，網平均から求められた調整変換パラメータのどちらか1つだけを受け入れます。網平均を行ない平均変換パラメータを計算し，GPS サイトキャリブレーションを行おうとする場合，キャリブレーションを続けるとパラメータが削除される，という警告を受けます。

ノート：網平均から求めた平均変換パラメータはTrimble Survey Controller へ転送できません。これを行うには，WGS 測地系上の調整から求められた保存されたキャリブレーション座標(WGS-84 ポイントとして)と，ローカル楕円体上で固定網平均から求められた保存された調整された座標(グリッドポイントとして)を使用してGPS サイトキャリブレーションを行う必要があります。


参考文献

書籍

B. Austin Barry著､1991年､｢Errors in Practical Measurement in Surveying, Engineering, and Technology｣､M. D. Morris編､ISBN0-910845-47-6. Rancho Cordova､Landmark Enterprises刊

B Hofmann-WellenhofとJames Collins Herbert Lichtenegger共著､1993年､｢Global Positioning System Theory and Practice｣第二版､ISBN:3-211-82477-4とISBN0-387-82477-4. New York､Springer-Verlag Wien刊

Alfred Leick著､1995年､｢GPS Satellite Surveying｣第二版､ISBN:0-471-30626-6.New York､John Wiley and Sons,Inc刊

Allen J Pope著､1976年､｢The Statistics of Residuals and the Detection of Outliers｣NOAA技術ﾚﾎﾟｰﾄNOS65 NGS1,Rockville,MD.

G�nter Seeber著､1993年､｢Satellite Geodesy,Foundations,Methods,and Applications｣､ISBN:3-11-012753-9.Berlin and NewYork､Walter deGruyter刊

U.S.National Geodetic Survey (NGS)､1986年､｢Geodetic Glossary｣､Silver Spring,MD:NGS Publications Information Center刊

Jan VanSickle著､1996年､｢GPS for Land Surveyors｣､ISBN 1-575-04041-7.AnnArbor､AnnArbor Press,Inc刊

Paul R.WolfとD.Ghilani Charles共著､1997年､｢Adjustment Computations:Statistics and Least Squares in Surveying and GIS｣､ISBN:0471-16833-5.New York､John Wiley and Sons,Inc刊

その他の情報源 － 米国での出版物と定期刊行物

以下の出版物は､土木工学やその他の測量事項に関する有益な情報源です。

｢ACSM Bulletin｣､ISSN:0747-9417､隔月刊､米国測量製図学会（American Congress on Surveying and Mapping,5410 Grosvenor Land,Suite 100,Bethesda,MD 20814-2144 USA）刊

｢GPS World:News and Applications of the Global Positioning System｣､ISSN:1048-5104､月刊､Advanstar Communications Inc.（Subscription offices:P.O.Box 6148,Duluth,MN 55806-6148 USA）刊

｢P.O.B.-Point of Beginning｣､ISSN:0739-3865､月刊､Business News Publishing Company（755 W.Big Beaver Road,Ste.1000,Troy,MI 48084 USA）刊

｢Professional Surveyor｣､ISSN:0278-1425､年10回発行､Professional Surveyors Publishing Company,Inc.（1713-J Rosemont Avenue,Frederick,MD 21702-4170 USA）刊


ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰ

ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰは､ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰの底部に小さなｳｨﾝﾄﾞｳとして表示されます。それは､Trimble Geomatics Officeのﾒｲﾝｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに表示されるﾃﾞｰﾀを反映しています。ﾒｲﾝｳｨﾝﾄﾞｳで何らかのｽﾞｰﾑﾂｰﾙを使用する場合､ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰ内のﾎﾞｯｸｽはこれを反映して変化します。それは常にﾌﾟﾛｼﾞｪｸﾄの範囲を表示します。

ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰを隠す（または表示する）

Trimble Geomatics Office内でｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰを隠す（または表示する）には､

1.	ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰで右ｸﾘｯｸします。

ｼｮｰﾄｶｯﾄﾒﾆｭｰが表示されます。

2.	ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰを選択します。

ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰを使用する

ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰを使用するには､

  ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰ内のﾌﾟﾛｼﾞｪｸﾄのあるｴﾘｱをｸﾘｯｸします。

ノート:このｴﾘｱはﾒｲﾝｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳの中心になります。

ｽﾞｰﾑするためにｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰを使用するには､

1.	ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰで､該当ｴﾘｱ周辺にﾎﾞｯｸｽをﾄﾞﾗｯｸﾞします。

ﾒｲﾝｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳが同じﾃﾞｰﾀを表示します。

2.	ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰのﾎﾞｯｸｽの中央をﾎﾟｲﾝﾄすると､ﾎﾟｲﾝﾀｰは [image] に変わります。これは､ｽﾞｰﾑを変更せずにﾌﾟﾛｼﾞｪｸﾄｴﾘｱにﾎﾞｯｸｽをﾄﾞﾗｯｸﾞできることを意味します。ﾒｲﾝｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳ内のﾌﾟﾛｼﾞｪｸﾄの表示はこういった動きを反映します。

ﾌﾟﾛｼﾞｪｸﾄの範囲へとｽﾞｰﾑするには､ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰでﾀﾞﾌﾞﾙｸﾘｯｸします。

ノート:ﾎｲｰﾙﾏｳｽを使用している場合には､ｽﾞｰﾑﾅﾋﾞｹﾞｰﾀｰﾎﾞｯｸｽのｻｲｽﾞを変更するのにﾎｲｰﾙを使用することができます。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　概要

ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰは､Trimble Geomatics Office で頻繁に使用されるﾀｽｸのｼｮｰﾄｶｯﾄを列記する､名前を持つｸﾞﾙｰﾌﾟから構成されています。各ｼｮｰﾄｶｯﾄはﾒﾆｭｰで利用できます。

ﾀｽｸに素早くｱｸｾｽするには､

1.	ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ上のｼｮｰﾄｶｯﾄをｸﾘｯｸします。

2.	ｼｮｰﾄｶｯﾄの別組へと移動するためにｸﾞﾙｰﾌﾟをｸﾘｯｸします。

ｼｮｰﾄｶｯﾄｱｲｺﾝのｻｲｽﾞを変更するには､

1.	ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰｴﾘｱで右ｸﾘｯｸします。

ｼｮｰﾄｶｯﾄﾒﾆｭｰが表示されます。

2.	大きいｱｲｺﾝか小さいｱｲｺﾝｵﾌﾟｼｮﾝを選択します。

ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰを隠す（または表示する）には以下の一つを行います。

ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰｴﾘｱで右ｸﾘｯｸします。

ｼｮｰﾄｶｯﾄﾒﾆｭｰが表示されます。｢隠す｣を選択します。

表示/ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰを選択します。

ﾂｰﾙﾊﾞｰでﾌﾟﾛｼﾞｪｸﾄﾊﾞｰｱｲｺﾝをｸﾘｯｸします。

開いているﾌﾟﾛｼﾞｪｸﾄが無い時には､ﾌﾟﾛｼﾞｪｸﾄとﾕｰﾃｨﾘﾃｨｸﾞﾙｰﾌﾟを利用できます。開いているﾌﾟﾛｼﾞｪｸﾄがある時にはｸﾞﾙｰﾌﾟの完全一覧（ﾕｰﾃｨﾘﾃｨｸﾞﾙｰﾌﾟを除く）を利用することができます。

ﾄﾘﾝﾌﾞﾙ測量ｸﾞﾙｰﾌﾟ

ﾌﾟﾛｼﾞｪｸﾄｸﾞﾙｰﾌﾟ

ｲﾝﾎﾟｰﾄｸﾞﾙｰﾌﾟ

処理ｸﾞﾙｰﾌﾟ(Trimble WAVE基線処理ﾓｼﾞｭｰﾙがｲﾝｽﾄｰﾙされている場合のみ)

調整ｸﾞﾙｰﾌﾟ(Trimbleﾈｯﾄﾜｰｸ調整ﾓｼﾞｭｰﾙがｲﾝｽﾄｰﾙされている場合のみ)

ｴｸｽﾎﾟｰﾄｸﾞﾙｰﾌﾟ

CADｸﾞﾙｰﾌﾟ

ﾕｰﾃｨﾘﾃｨｸﾞﾙｰﾌﾟ


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　ﾄﾘﾝﾌﾞﾙ測量ｸﾞﾙｰﾌﾟ

ﾄﾘﾝﾌﾞﾙ測量ｸﾞﾙｰﾌﾟは､Survey View（測量表示）で頻繁に使用されるﾀｽｸへの素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。ｼｮｰﾄｶｯﾄは､一般的に使用される順番で並べられています。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　ﾌﾟﾛｼﾞｪｸﾄｸﾞﾙｰﾌﾟ

ﾌﾟﾛｼﾞｪｸﾄｸﾞﾙｰﾌﾟには､ﾌﾟﾛｼﾞｪｸﾄｺﾏﾝﾄﾞへの素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　ｲﾝﾎﾟｰﾄｸﾞﾙｰﾌﾟ

ｲﾝﾎﾟｰﾄｸﾞﾙｰﾌﾟは､頻繁に使用される測量ﾃﾞｰﾀｿｰｽからｲﾝﾎﾟｰﾄするための素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　処理ｸﾞﾙｰﾌﾟ

処理ｸﾞﾙｰﾌﾟは､頻繁に使用される基線処理ﾀｽｸへの素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。

注:基線処理ﾓｼﾞｭｰﾙがｲﾝｽﾄｰﾙされている必要があります。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　調整ｸﾞﾙｰﾌﾟ

調整ｸﾞﾙｰﾌﾟは､頻繁に使用される調整ﾀｽｸへの素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。

注:網調整ﾓｼﾞｭｰﾙがｲﾝｽﾄｰﾙされている必要があります。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　ｴｸｽﾎﾟｰﾄｸﾞﾙｰﾌﾟ

ｴｸｽﾎﾟｰﾄｸﾞﾙｰﾌﾟは､頻繁に使用されるﾃﾞｰﾀﾌｫｰﾏｯﾄへﾌﾟﾛｼﾞｪｸﾄのﾃﾞｰﾀをｴｸｽﾎﾟｰﾄするための､素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　CADｸﾞﾙｰﾌﾟ

CADｸﾞﾙｰﾌﾟは､Plan View（計画表示）で頻繁に使用されるﾀｽｸへの素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます


ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰ　－　ﾕｰﾃｨﾘﾃｨｸﾞﾙｰﾌﾟ

ﾕｰﾃｨﾘﾃｨｸﾞﾙｰﾌﾟは､Trimble Geomatics Office ｼｽﾃﾑと共に含まれる､頻繁に使用されるﾕｰﾃｨﾘﾃｨへの素早いｱｸｾｽを提供するｼｮｰﾄｶｯﾄを含みます。


属性　－　概要
属性　−　概要

詳細

利用方法	ﾀﾞｲｱﾛｸﾞ	関連項目
概要

属性は､特徴ｺｰﾄﾞについての説明的情報の一片です。例えば､｢木｣特徴ｺｰﾄﾞと一緒に､種族や高さ､幹周り､状態などの属性を持つことができます。ﾌｨｰﾙﾄﾞで収集するそれぞれの｢木｣特徴ｺｰﾄﾞは､こういった属性に対して独自の値を持ちます。

Trimble Geomatics Office は､ﾎﾟｲﾝﾄと共に属性情報の管理をｻﾎﾟｰﾄします。Trimble Geomatics Office は以下の作業を可能にします。

属性定義を含む特徴･属性ﾗｲﾌﾞﾗﾘを作成するためにTrimble Feature and Attribute Editor�（特徴･属性ｴﾃﾞｨﾀ）ﾕｰﾃｨﾘﾃｨを使用

属性を含むSurvey Controller (*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ

属性情報の表示と編集

属性の追加

Geographic Information System (GIS)ﾌｫｰﾏｯﾄにﾃﾞｰﾀをｴｸｽﾎﾟｰﾄ

属性ﾚﾎﾟｰﾄの生成

特徴･属性ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨを使用して､特徴ｺｰﾄﾞに対する一連の属性を定義します。それぞれの属性に対して属性の名前とﾀｲﾌﾟを定義しなければなりません。属性ﾀｲﾌﾟは､属性情報のﾌｫｰﾏｯﾄを限定します。例えば､｢木｣に対する属性が高さの場合､属性のﾀｲﾌﾟは｢数値｣です。

属性情報を収集するためにﾃﾞｰﾀ辞書ﾌｧｲﾙ(*.ddf)を使用することができます。.ddfﾌｧｲﾙを作成するには､Trimble のData Dictionary Editor�（ﾃﾞｰﾀ辞書ｴﾃﾞｨﾀ）ﾕｰﾃｨﾘﾃｨを使用します。これは､GPS Pathfinder Officeｮｿﾌﾄｳｪｱの一部です。

手順

Trimble Geomatics Office で属性情報を管理する手順は､

1.	特徴･属性ｴﾃﾞｨﾀで特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙを作成します。

2.	Trimble Geomatics Officeで､.fclか.ddfﾌｧｲﾙを選択することによって属性に対してﾌﾟﾛｼﾞｪｸﾄを設定します。

3.	Trimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.00以降）に.fclか.ddfを転送します。

4.	ﾌｨｰﾙﾄﾞでﾃﾞｰﾀを収集します。

5.	Trimble Geomatics Office にﾌｨｰﾙﾄﾞﾃﾞｰﾀを転送します。

6.	GISかｶｽﾀﾑasciiﾌｫｰﾏｯﾄでﾃﾞｰﾀをｴｸｽﾎﾟｰﾄします。


特徴･属性ﾗｲﾌﾞﾗﾘ　－　概要
特徴･属性ﾗｲﾌﾞﾗﾘ　−　概要

詳細

利用方法

概要

特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙとは､特徴ｺｰﾄﾞや属性､CADｽﾀｲﾙ､ｺﾝﾄﾛｰﾙｺｰﾄﾞの定義を含むﾃｷｽﾄﾌｧｲﾙです。特徴･属性ﾗｲﾌﾞﾗﾘを編集するには､Trimble のFeature and Attribute Editor�（特徴･属性ｴﾃﾞｨﾀ）ﾕｰﾃｨﾘﾃｨを使用します。

特徴･属性ﾗｲﾌﾞﾗﾘとは､特徴ｺｰﾄﾞが処理される時に実行される作業を説明する一連の命令です。例えば､

あるﾎﾟｲﾝﾄに対して特定のﾎﾟｲﾝﾄｽﾀｲﾙを割り当てます。

ﾎﾟｲﾝﾄ間のﾗｲﾝを作成します。

ﾌｨｰﾙﾄﾞで収集する属性を定義します。

ﾎﾟｲﾝﾄとﾗｲﾝを注釈します。

特徴･属性ﾗｲﾌﾞﾗﾘの作成に関する詳細は､特徴･属性ｴﾃﾞｨﾀのｵﾝﾗｲﾝﾍﾙﾌﾟを参照してください。

特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙ(*.fcl)を使用して､以下を行うことができます。

特徴ｺｰﾄﾞの処理

ﾌｨｰﾙﾄﾞでのﾃﾞｰﾀ収集のための属性の定義

特徴 ｺｰﾄﾞ処理

特徴ｺｰﾄﾞ処理に特徴･属性ﾗｲﾌﾞﾗﾘを使用するにあたっての詳細は､特徴ｺｰﾄﾞ－概要の項を参照してください。

属性

属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するためにﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞを使用します。特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙかﾃﾞｰﾀ辞書ﾌｧｲﾙ(*ddf)を選択できます。


属性に対してﾌﾟﾛｼﾞｪｸﾄを設定

概要と詳細

Trimble Geomatics Office で属性を使用するには､属性に対してﾌﾟﾛｼﾞｪｸﾄを設定しなければなりません。これを行うには､使用したい特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)かﾃﾞｰﾀ辞書ﾌｧｲﾙ(*ddf)を選択します。

ﾋﾝﾄ:.fclと.ddfﾌｧｲﾙの選択方法の詳細に関しては､属性に対してﾌﾟﾛｼﾞｪｸﾄを設定の項目を参照してください。

Trimble Geomatics Office は､属性を持つそれぞれの特徴ｺｰﾄﾞに対してﾃｰﾌﾞﾙを作成します。ﾗｲﾌﾞﾗﾘﾌｧｲﾙはﾌﾟﾛｼﾞｪｸﾄに保管されていません。これは､ﾗｲﾌﾞﾗﾘに変更が行われてもﾌﾟﾛｼﾞｪｸﾄは更新されないことを意味します。

ﾌﾟﾛｼﾞｪｸﾄに対する特徴･属性ﾗｲﾌﾞﾗﾘの変更

ﾌﾟﾛｼﾞｪｸﾄに対する特徴･属性ﾗｲﾌﾞﾗﾘを変更するには､上で説明されたように選択を行います。しかし､以下を行った後にはTrimble Geomatics Office でその変更はできません。

属性を含むSurvey Controller (*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ

Trimble Geomatics Office に属性ﾚｺｰﾄﾞの追加

これは､現存する特徴ﾃｰﾌﾞﾙが削除され､新しいﾃｰﾌﾞﾙが選択されたﾗｲﾌﾞﾗﾘを使用して作成されたためです。

ﾌﾟﾛｼﾞｪｸﾄに対する特徴･属性ﾗｲﾌﾞﾗﾘを本当に変更する必要がある場合には､属性を持つﾎﾟｲﾝﾄすべてを削除し､ﾌﾟﾛｼﾞｪｸﾄを再び開いてから新しい特徴･属性ﾗｲﾌﾞﾗﾘを選択することができます。

Trimble Survey Controller

Trimble Geomatics Office で使用された特徴･属性ﾗｲﾌﾞﾗﾘ（またはﾃﾞｰﾀ辞書ﾌｧｲﾙ）が､Trimble Survey Controller がﾌｨｰﾙﾄﾞで使用するものと同一であることを確認する必要があります。異なるﾗｲﾌﾞﾗﾘを使用する場合､いくつかの属性ﾃﾞｰﾀはｲﾝﾎﾟｰﾄされない可能性があります。

ﾗｲﾌﾞﾗﾘが異なる時に属性を持つﾃﾞｰﾀをｲﾝﾎﾟｰﾄするに際しての情報は､異なる定義を持つ属性のｲﾝﾎﾟｰﾄを参照してください。


ﾃﾞｰﾀ辞書ﾌｧｲﾙ　－　概要
ﾃﾞｰﾀ辞書ﾌｧｲﾙ　−　概要

詳細

関連項目

概要

ﾃﾞｰﾀ辞書ﾌｧｲﾙとは､特徴と特徴に関連する属性を定義するﾌｧｲﾙです。

特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙの代用として使用されることができます。

Data Dictionary Editor（ﾃﾞｰﾀ辞書ｴﾃﾞｨﾀ）ﾕｰﾃｨﾘﾃｨ（これはGPS Pathfinder Office の一部です。）を持つ場合には､それを使用してﾃﾞｰﾀ辞書ﾌｧｲﾙ(*.ddf)を作成することができます。.ddfﾌｧｲﾙは特徴と属性の定義を含みます。

属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するために.ddfﾌｧｲﾙの使用

属性に対してTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄを設定するために.ddfﾌｧｲﾙを使用します。これを行うと､.ddfﾌｧｲﾙ内のあらゆるﾗｲﾝやｴﾘｱ特徴はﾎﾟｲﾝﾄ特徴として扱われます。これは､Trimble Geomatics Office とTrimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.00以降）がﾎﾟｲﾝﾄ特徴のみをｻﾎﾟｰﾄするためです。

特徴･属性ｴﾃﾞｨﾀで.ddfﾌｧｲﾙの使用

注: 属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するのに使用される特徴･属性ﾗｲﾌﾞﾗﾘは､特徴ｺｰﾄﾞ処理に使用される特徴･属性ﾗｲﾌﾞﾗﾘと同一である必要はありません。しかし､特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙを使用してﾌｨｰﾙﾄﾞで属性ﾃﾞｰﾀを収集する場合､特徴ｺｰﾄﾞを処理するのに同一のﾗｲﾌﾞﾗﾘが必要です。

特徴･属性ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨを使用して特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙ(*.fcl)に.ddfﾌｧｲﾙをｲﾝﾎﾟｰﾄすることができます。.fclﾌｧｲﾙを.ddfﾌｧｲﾙとしてｴｸｽﾎﾟｰﾄすることもできます。.ddfﾌｧｲﾙをﾃﾞｰﾀ辞書ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨと一緒に使用したい場合にはこういったﾀｽｸが便利です。

Trimble Survey Controller で.ddfﾌｧｲﾙの使用

ﾌｨｰﾙﾄﾞで属性を定義するﾗｲﾌﾞﾗﾘとして.ddfﾌｧｲﾙを使用することができます。これを行うには､Trimble Survey Controller に.ddfﾌｧｲﾙを転送します。


異なる定義を持つ属性のｲﾝﾎﾟｰﾄ

概要と詳細

属性を含むSurvey Controller (*.dc)ﾌｧｲﾙをｲﾝﾎﾟｰﾄする時､.dcﾌｧｲﾙ内の属性定義はﾌﾟﾛｼﾞｪｸﾄ内の属性定義と比較されます。それが何らかの形で異なる場合には､ﾀﾞｲｱﾛｸﾞが現れ､以下を実行するかを尋ねます。

特徴･属性ﾗｲﾌﾞﾗﾘとﾃﾞｰﾀ辞書ﾌｧｲﾙの両方に共通な属性情報のｲﾝﾎﾟｰﾄ

このｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller にﾌｧｲﾙを転送した後にﾌﾟﾛｼﾞｪｸﾄに対する特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙ内のあらゆる属性定義を変更する場合､その特徴ｺｰﾄﾞに対するすべての属性情報を失います。新しい特徴ｺｰﾄﾞを追加しただけの場合には､ﾃﾞｰﾀは失われません。

特徴ｺｰﾄﾞと一緒に､しかし属性情報なしでﾎﾟｲﾝﾄを挿入します。

ｲﾝﾎﾟｰﾄを取り消します。

このﾒｯｾｰｼﾞが現れないようにするには､属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するために使用されるﾌｧｲﾙがTrimble Survey Controller で使用されるものと同一であることを確認します。


Trimble Geomatics Office で属性の表示と編集

概要と詳細

Trimble Geomatics Office 内のﾎﾟｲﾝﾄに対する属性を表示したり編集したりするのに､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを使用します。ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞで属性に対するﾌﾟﾛｼﾞｪｸﾄを設定した場合には､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳに属性ﾀﾌﾞが現れます。選択されたﾎﾟｲﾝﾄに対して属性を持つ特徴が複数ある場合には､属性を表示したい特徴を選択するためにﾄﾞﾛｯﾌﾟﾀﾞｳﾝ一覧を使用します。属性値を編集するには､｢値｣列の適切なﾌｨｰﾙﾄﾞをｸﾘｯｸします。

ﾒﾆｭｰ属性に対して､

有効な属性値の一覧から値を選択します。

その他すべての属性ﾀｲﾌﾟに対しては､

ｷｰﾎﾞｰﾄﾞを使用して属性に対する新しい値を入力します。属性に対してﾌｨｰﾙﾄﾞ記入を使用することはできません。

注:属性情報を編集する時､Trimble Geomatics Office は新しい値が有効であることを確認するために特徴･属性ﾗｲﾌﾞﾗﾘの定義をﾁｪｯｸします。


ﾌﾟﾛｼﾞｪｸﾄ間で属性を持つﾎﾟｲﾝﾄのｺﾋﾟｰ､切り取り､貼り付け

関連項目

属性を持つﾎﾟｲﾝﾄのｺﾋﾟｰ､切り取り､貼り付けを行うには､2つのﾌﾟﾛｼﾞｪｸﾄを設定するのに使用された特徴･属性ﾗｲﾌﾞﾗﾘが同一でなければなりません。

特徴･属性ﾗｲﾌﾞﾗﾘが異なるけれども､共通の属性定義を持つ場合には､使用者は警告され､｢貼り付けの取消し｣か｢ﾎﾟｲﾝﾄのみの貼り付け（属性なし）｣､｢2つのﾗｲﾌﾞﾗﾘに共通な属性を持つﾎﾟｲﾝﾄを貼り付け｣のｵﾌﾟｼｮﾝから選択するようになります。Trimble Geomatics Office はｲﾝﾎﾟｰﾄ.rptﾚﾎﾟｰﾄに貼り付けられなかった属性を記録します。

ﾌﾟﾛｼﾞｪｸﾄが既に属性を持つﾎﾟｲﾝﾄを含む場合には､属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するために異なるﾗｲﾌﾞﾗﾘを選択することができません。これは､属性定義が既に設定されているためです。しかし､新しいﾌﾟﾛｼﾞｪｸﾄを作成し､特徴･属性ﾗｲﾌﾞﾗﾘ（またはﾃﾞｰﾀ辞書ﾌｧｲﾙ）で新しい属性定義を定義してから､現存するﾌﾟﾛｼﾞｪｸﾄから新しいﾌﾟﾛｼﾞｪｸﾄに属性を持つﾎﾟｲﾝﾄをｺﾋﾟｰすることはできます。

注:以下が正しい場合にのみ､ｺﾋﾟｰや切り取り､貼り付けを行うことができます。

ｺﾋﾟｰまたは切り取られたﾎﾟｲﾝﾄすべてが標高を持ちます。

ﾌﾟﾛｼﾞｪｸﾄは特定された標準標高を持ちます。この標準はﾇﾙ標高を持つﾎﾟｲﾝﾄに対して使用されます。

これは､ｺﾋﾟｰまたは切り取られたﾎﾟｲﾝﾄに対する座標がWGS-84楕円体に縮小されたためです。貼り付けしようとしているﾌﾟﾛｼﾞｪｸﾄ内の座標系は､貼り付けられたﾎﾟｲﾝﾄに適用します。貼り付けしようとしているﾌﾟﾛｼﾞｪｸﾄが異なる座標系を含む場合には､正しい座標が示されます。


.fclﾌｧｲﾙと.ddfﾌｧｲﾙの違い

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄで特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙかﾃﾞｰﾀ辞書(*.ddf)ﾌｧｲﾙを使用することができます。現在のﾌﾟﾛｼﾞｪｸﾄに対するﾌｧｲﾙを選択するには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/特徴ﾀﾌﾞを選択します。2つのﾌｧｲﾙの違いは以下に説明されています。

.fclﾌｧｲﾙ

.fclﾌｧｲﾙは､属性定義に対してと同様､特徴ｺｰﾄﾞに対してのCAD設定（例えば､ﾎﾟｲﾝﾄｽﾀｲﾙ､ﾗｲﾝｽﾀｲﾙ､注釈ｽﾀｲﾙ､ｺﾝﾄﾛｰﾙｺｰﾄﾞ）を含むことができます。属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するために.fclﾌｧｲﾙを選択すると､Trimble Geomatics Office は必要なﾃｰﾌﾞﾙを作成するために属性定義を使用します。

Trimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.00以降）への属性を持つ.fclﾌｧｲﾙのｴｸｽﾎﾟｰﾄを選ぶ場合にも同じ過程が起こります。

特徴ｺｰﾄﾞを使用して属性を収集したい場合には､.fclﾌｧｲﾙを使用します。既に.ddfﾌｧｲﾙを持つけれども特徴ｺｰﾄﾞが欲しい場合には､特徴･属性ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨで.ddfﾌｧｲﾙを.fclﾌｧｲﾙにｲﾝﾎﾟｰﾄしてから.fclﾌｧｲﾙを使用します。

詳細に関しては､特徴･属性ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨのﾍﾙﾌﾟを参照してください。

.ddfﾌｧｲﾙ

.ddfﾌｧｲﾙは特徴ｺｰﾄﾞに対するCAD設定を含むことができません。それは､特徴と属性の定義しか含むことはできません。.ddfﾌｧｲﾙから特徴ｺｰﾄﾞを処理する場合には､どのﾎﾟｲﾝﾄやﾗｲﾝ､注釈ｽﾀｲﾙも割り当てられません。

ﾃﾞｰﾀ辞書ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨ（GPS Pathfinder Office を持っている場合）から､またはTrimble Geomatics Office の特徴･属性ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨから.ddfﾌｧｲﾙを作成することができます。（ﾌｧｲﾙ/ddfﾌｧｲﾙをｴｸｽﾎﾟｰﾄするために特徴･属性ｴﾃﾞｨﾀでｴｸｽﾎﾟｰﾄを選択します。）


ﾃﾞｰﾀ転送　－　概要

Trimble のData Transfer（ﾃﾞｰﾀ転送）ﾕｰﾃｨﾘﾃｨは､Trimble Geomatics Office と装置の間でﾃﾞｰﾀを転送するのに使用されるｿﾌﾄｳｪｱです。装置には､Survey ControllerやTrimble GPS受信機､一般測量ﾄｰﾀﾙｽﾃｰｼｮﾝ､SDRﾌｫｰﾏｯﾄﾃﾞｰﾀｺﾚｸﾀｰ､ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙ､ｺﾝﾄﾛｰﾙﾕﾆｯﾄ､PCｶｰﾄﾞが含まれます。ﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨを使用してﾃﾞｰﾀを転送できるようにするには､必要な装置を設定することが必要です。

装置が設定してある場合､Trimble Geomatics Office 内からﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨにｱｸｾｽするには､以下を行います。

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄかﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄ（何を行いたいかに依ります）を選択します。適切なﾀﾞｲｱﾛｸﾞが現れます。

2.	必要なｵﾌﾟｼｮﾝを選択します。

ﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨを開くには､装置に接続を必要とするｵﾌﾟｼｮﾝを選択します。

選択に従って､｢名前を付けて保存｣か｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	ﾃﾞｰﾀ転送を行うのに必要な装置を選択します。

ﾌﾟﾛｼﾞｪｸﾄ外からのﾃﾞｰﾀ転送 ﾕｰﾃｨﾘﾃｨへのｱｸｾｽ

ﾌﾟﾛｼﾞｪｸﾄが開いていない場合には､ｺﾝﾋﾟｭｰﾀｰと装置の間でﾌｧｲﾙを転送できます。

これを行うには､

Trimble Geomatics Office から､ﾕｰﾃｨﾘﾃｨ/ﾃﾞｰﾀ転送を選択します。

Trimble Geomatics Office 外からのﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨへのｱｸｾｽ

Trimble Geomatics Office 外から､ご利用のｺﾝﾋﾟｭｰﾀｰからある装置にﾌｧｲﾙを転送できます。

これを行うには､

ｽﾀｰﾄ/ﾌﾟﾛｸﾞﾗﾑ/ﾃﾞｰﾀ転送を選択します。


装置　－　概要

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄと装置の間でﾃﾞｰﾀを転送するには､装置を正しく設定する必要があります。

装置を設定すると､それはｲﾝﾎﾟｰﾄやｴｸｽﾎﾟｰﾄ中にいつでも利用できます。詳細に関しては､Data Transfer ﾍﾙﾌﾟを参照してください。


｢DATﾁｪｯｸｲﾝ｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､Trimble Geomatics OfficeﾌﾟﾛｼﾞｪｸﾄにGPS観測をｲﾝﾎﾟｰﾄする前に､GPSﾌｧｲﾙ内の値をﾁｪｯｸして補正します。

ﾉｰﾄ:ﾀﾞｲｱﾛｸﾞ内で行う変更は､ｲﾝﾎﾟｰﾄされたﾃﾞｰﾀのみに影響を与えます。変更はGPSﾃﾞｰﾀﾌｧｲﾙ(*.dat)に影響を与えません。

ｲﾝﾎﾟｰﾄを行うとﾀﾞｲｱﾛｸﾞが現れます。

GPSﾃﾞｰﾀﾌｧｲﾙ(*.dat)

RINEXﾌｧｲﾙ(*.Xxo､*.XXn､*.obs､*.nav)

関連する.datﾌｧｲﾙを持つDCﾌｧｲﾙ

使用

ﾌﾟﾛｼﾞｪｸﾄにﾃﾞｰﾀ転送したくない場合には､このﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。

名前

ﾃﾞｰﾀが観測されたﾎﾟｲﾝﾄの名前を表示します。ﾌｧｲﾙ内のﾎﾟｲﾝﾄに名前が割り当てられなかった場合には､ｽﾃｰｼｮﾝIDが使用されます。このﾌｨｰﾙﾄﾞを変更するにはｷｰﾎﾞｰﾄﾞを使用して名前を入力します。

ﾌｧｲﾙ名

ﾃﾞｰﾀのﾌｧｲﾙｿｰｽを表示します。

開始時刻

観測の開始時刻と日付を表示します。

終了時刻

観測の終了時刻と日付を表示します。

受信機ﾀｲﾌﾟ

ﾃﾞｰﾀを収集するのに使用されるGPS受信機のﾀｲﾌﾟを一覧化します。

受信機S/N

受信機のｼﾘｱﾙ番号を表示します。この番号は編集可能です。

ｱﾝﾃﾅ高

観測のために入力されたｱﾝﾃﾅ高を表示します。観測中に誤った高度が入力された場合には､このﾌｨｰﾙﾄﾞを変更するためにｷｰﾎﾞｰﾄﾞを使用して値を入力します。

ｱﾝﾃﾅﾀｲﾌﾟ

受信機に接続されたｱﾝﾃﾅのﾀｲﾌﾟを表示します。観測中に誤ったｱﾝﾃﾅが入力された場合には､このﾌｨｰﾙﾄﾞを変更するために一覧からｱﾝﾃﾅﾀｲﾌﾟを選択します。

測定方法

ｱﾝﾃﾅの測定方法を表示します。観測中に誤った方法が入力された場合には､このﾌｨｰﾙﾄﾞを変更するために一覧からｵﾌﾟｼｮﾝを選択します。

特徴ｺｰﾄﾞ

ﾎﾟｲﾝﾄに割り当てられた特徴ｺｰﾄﾞ値を表示します。このﾌｨｰﾙﾄﾞを変更するためには､ｷｰﾎﾞｰﾄﾞを使用して新しい値を入力します。

ﾘｾｯﾄ

ﾘｾｯﾄをｸﾘｯｸして､元来の設定を復元します。

ﾋﾝﾄ:複数のﾎﾟｲﾝﾄに同じ変更を適用したい場合には､Ctrlを押したまま､変更したい列の下の該当ﾌｨｰﾙﾄﾞを選択します。後に続く行を選択したい場合には､Shiftを押します。選択中のすべてのﾌｨｰﾙﾄﾞに適用したい値を､選択されたﾌｨｰﾙﾄﾞ内で選択するか入力します。


｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟ－ﾄ｣ﾀﾞｲｱﾛｸﾞ
｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞ

関連項目

｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞを使用して､

ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙからﾃﾞｰﾀを表示します。

その間でﾃﾞﾙﾀ標高を算出したいﾎﾟｲﾝﾄを限定します。

始点の標高を有効にします。

既知ﾎﾟｲﾝﾄの不閉合を限定します。

ﾎﾟｲﾝﾄ名を有効にします。

ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙ(*.dat,*.raw)をｲﾝﾎﾟｰﾄすると､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。これを行うには､

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙ(*.dat,*.raw)を選択します。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙを選択します。

4.	｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾀﾞｲｱﾛｸﾞ内で行う変更は､ｲﾝﾎﾟｰﾄされたﾃﾞｰﾀのみに影響を与えます。その変更は､ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙ(*.dat､*.raw)ﾌｧｲﾙには影響を与えません。

ﾉｰﾄ:ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾃﾞｰﾀをｲﾝﾎﾟｰﾄする時､重複ﾎﾟｲﾝﾄがどのように扱われるのかを特定することができます。標準では､Trimble Geomatics Office がｲﾝﾎﾟｰﾄ中に同じ名前を持つﾎﾟｲﾝﾄを結合するので､重複ﾎﾟｲﾝﾄは作成されません。｢重複ﾎﾟｲﾝﾄｵﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞでは､重複ﾎﾟｲﾝﾄを結合するべき垂直許容値を特定するために｢許容値内の重複ﾎﾟｲﾝﾄを結合｣ｵﾌﾟｼｮﾝを使用することができます。ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾃﾞｰﾀをｲﾝﾎﾟｰﾄする時には水平許容値は使用されません。

ﾉｰﾄ:DiNi ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙ装置から直接ﾃﾞｰﾀをｲﾝﾎﾟｰﾄできます。それを行う時には､「ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾋﾝﾄ:ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄﾃﾞｰﾀを収集する時､Trimble Geomatics Office にｲﾝﾎﾟｰﾄしたいﾎﾟｲﾝﾄを独特な接頭辞か接尾辞を付けて保存します。例えば､ｽﾃｰｼｮﾝﾎﾟｲﾝﾄとして使用したいﾎﾟｲﾝﾄすべてに接頭辞STNを付けて保存します。これによって､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞでﾌｨﾙﾀｰで選択ﾎﾞﾀﾝを使用して簡単にﾎﾟｲﾝﾄ（またはｲﾝﾎﾟｰﾄしたくないﾎﾟｲﾝﾄ）を選択できるようになります。

標高ｸﾞﾙｰﾌﾟでは､以下のﾌｨｰﾙﾄﾞを見ることができます。

始点

始点の名前です。一連のﾚﾍﾞﾙ観測の始点は､始点ｱｲｺﾝで示されます。

標高

始点の標高です。ﾎﾟｲﾝﾄがﾃｰﾌﾞﾙ内で選択される時､始点の標高を編集することができます。ﾃｰﾌﾞﾙ内で他のﾚﾍﾞﾙの環を選択することで､標高ｸﾞﾙｰﾌﾟ内のその環の始点を示します。ﾚﾍﾞﾙの環の終わりと別の環の始まりは､ﾃｰﾌﾞﾙの中の太い黒の水平線で示されます。

標高の質

標高の質ﾌｨｰﾙﾄﾞです。標高の質を変更するには､質ﾎﾞﾀﾝをｸﾘｯｸします。

ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾃｰﾌﾞﾙ内のﾃﾞｰﾀは､観測が行われた順序で示されます。以下の列を見ることができます。

列	表示内容
ｽﾃｰｼｮﾝﾎﾟｲﾝﾄ	ﾎﾟｲﾝﾄ名と､Trimble Geomatics Office にｲﾝﾎﾟｰﾄするのにそのﾎﾟｲﾝﾄがｽﾃｰｼｮﾝﾎﾟｲﾝﾄとして選択されたかどうか。ﾌｧｲﾙをｲﾝﾎﾟｰﾄする時､すべての観測が標準によって選択されます。ｽﾃｰｼｮﾝﾎﾟｲﾝﾄ名は編集することができます。
BS	後視に対するﾚﾍﾞﾙ観測。
IS	中間視準点に対するﾚﾍﾞﾙ観測。対応する後視が選択されるまでは中間視準点を選択することはできません。
FS	前視に対するﾚﾍﾞﾙ観測。
標高	ﾎﾟｲﾝﾄの標高。どのﾎﾟｲﾝﾄが標高計算の始点として使用されたかを示すのにｱｲｺﾝが使用されます。これは､標高ｸﾞﾙｰﾌﾟに示される始点に対応します。 それぞれの環の始点標高は､標高ｸﾞﾙｰﾌﾟから編集できます。 ﾎﾟｲﾝﾄが標高を持たない場合には､ﾎﾟｲﾝﾄの標高を算出するのに始点は選択されません。
距離	後視か前視､中間視準点までの距離。
説明	ﾚﾍﾞﾙ化されたﾎﾟｲﾝﾄの説明
杭打ちしたﾃﾞﾙﾀ	杭打ちされたﾎﾟｲﾝﾄとそのﾎﾟｲﾝﾄ位置に対する設計高度の間の標高差。

ﾃｰﾌﾞﾙでﾎﾟｲﾝﾄを選択するには､以下の1つを行います。

｢ｽﾃｰｼｮﾝﾎﾟｲﾝﾄ｣列のﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

｢ｽﾃｰｼｮﾝﾎﾟｲﾝﾄ｣列の見出しをｸﾘｯｸします。列の一番上をｸﾘｯｸしてから列内の最初のﾎﾟｲﾝﾄを選択することで､ﾃｰﾌﾞﾙ内のすべてのﾎﾟｲﾝﾄを選択することができます。

ﾌｨﾙﾀｰで選択をｸﾘｯｸします。

選択を特定すると､以下の規則が適用されます。

先行する後視が選択されるまで､中間視準点を選択することはできません。

同じ名前を持つ複数の視準点が存在する場合には､それは同じ名前を持つその他のすべての観測（中間視準点を除く）を選択します。

ﾌｨﾙﾀｰで選択をｸﾘｯｸすると､｢ﾚﾍﾞﾙｽﾃｰｼｮﾝの定義｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾉｰﾄ:以下のﾃﾞｼﾞﾀﾙﾚﾍﾞﾙと保存ﾌｫｰﾏｯﾄがｻﾎﾟｰﾄされています。

ﾉｰﾄ:Trimble Geomatics Office は､330ﾚｺｰﾄﾞである一連のﾚﾍﾞﾙ観測外で記録されたLeica計測ﾚｺｰﾄﾞをｻﾎﾟｰﾄしません


｢ﾚﾍﾞﾙｽﾃｰｼｮﾝ定義｣ﾀﾞｲｱﾛｸﾞ

詳細

関連項目

｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞでﾌｨﾙﾀｰで選択をｸﾘｯｸすると､｢ﾚﾍﾞﾙｽﾃｰｼｮﾝ定義｣ﾀﾞｲｱﾛｸﾞが現れます。このﾌｨﾙﾀｰｵﾌﾟｼｮﾝを使用して､ｽﾃｰｼｮﾝﾎﾟｲﾝﾄを選択したり､選択を解除したりします。標準では､すべてのｽﾃｰｼｮﾝﾎﾟｲﾝﾄは､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞで選択されます。

ﾋﾝﾄ:ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄﾃﾞｰﾀを収集する時､Trimble Geomatics Office にｲﾝﾎﾟｰﾄしたいﾎﾟｲﾝﾄを独特な接頭辞か接尾辞を付けて保存します。例えば､ｽﾃｰｼｮﾝﾎﾟｲﾝﾄとして使用したいﾎﾟｲﾝﾄすべてに接頭辞STNを付けて保存します。これによって､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞでﾌｨﾙﾀｰで選択ﾎﾞﾀﾝを使用して簡単にﾎﾟｲﾝﾄを選択できるようになります。

以下のようなｵﾌﾟｼｮﾝがあります。

該当ﾎﾟｲﾝﾄの選択

このｵﾌﾟｼｮﾝを使用して､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞのｽﾃｰｼｮﾝﾎﾟｲﾝﾄ列にあるｽﾃｰｼｮﾝﾎﾟｲﾝﾄを選択します。例えば､特定な接頭辞か接尾辞を持つｽﾃｰｼｮﾝﾎﾟｲﾝﾄを選択することができます。

ﾉｰﾄ:指定された接頭辞か接尾辞を持たないﾎﾟｲﾝﾄはすべてそのﾁｪｯｸﾎﾞｯｸｽがｵﾌになります。

該当ﾎﾟｲﾝﾄ以外の選択

このｵﾌﾟｼｮﾝを使用して､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞのｽﾃｰｼｮﾝﾎﾟｲﾝﾄ列の特定ﾎﾟｲﾝﾄに対するﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。

ﾉｰﾄ: 指定された接頭辞か接尾辞を持たないﾎﾟｲﾝﾄはすべてそのﾁｪｯｸﾎﾞｯｸｽがｵﾝになります。

名前

このﾌｨｰﾙﾄﾞを使用して､名前でﾎﾟｲﾝﾄを選択します。｢?｣や｢*｣､｢#｣のﾜｲﾙﾄﾞｶｰﾄﾞを使用してﾎﾟｲﾝﾄ名を選択することができます。

説明

このﾌｨｰﾙﾄﾞを使用して､説明でﾎﾟｲﾝﾄを選択します。ここでも､ﾜｲﾙﾄﾞｶｰﾄﾞを使用して説明を選択することができます。

例

｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞのｽﾃｰｼｮﾝﾎﾟｲﾝﾄ列で｢IS｣という接頭辞を持つﾎﾟｲﾝﾄを選択したくない場合には､

1.	｢ﾚﾍﾞﾙｽﾃｰｼｮﾝ定義｣ﾀﾞｲｱﾛｸﾞで､｢該当ﾎﾟｲﾝﾄ以外の選択｣ｵﾌﾟｼｮﾝを選択します。

2.	｢名前｣ｵﾌﾟｼｮﾝを選択して､｢IS*｣を入力します。


網平均でﾚﾍﾞﾙ観測を使用

ﾚﾍﾞﾙﾃﾞｰﾀを使用して網平均を実行したい場合には､ﾚﾍﾞﾙ観測標準ｴﾗｰが定義されていなければなりません。ｿﾌﾄｳｪｱは以下の状況において標準ｴﾗｰを計算します。

ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾃﾞｰﾀをｲﾝﾎﾟｰﾄする場合､標準ｴﾗｰ（ﾃﾞﾙﾀ標高）は変曲点の数を使用して計算されます。

Trimble Data Exchangeﾌｫｰﾏｯﾄを使用して､ｲﾝﾎﾟｰﾄﾌｫｰﾏｯﾄに変曲点の数を含む場合には､標準ｴﾗｰが計算されます。または､標準ｴﾗｰ（ﾃﾞﾙﾀ標高）はﾌｧｲﾙから直接使用することもできます。

標準ｴﾗｰが定義されていない場合には､ﾚﾍﾞﾙ観測は調整のための印は付けられません。

ﾉｰﾄ:ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳでそれぞれのﾃﾞﾙﾀ標高の標準ｴﾗｰか変曲点の数を入力することができます。


｢GISｴｸｽﾎﾟ－ﾄ失敗｣ﾀﾞｲｱﾛｸﾞ
｢GISｴｸｽﾎﾟｰﾄ失敗｣ﾀﾞｲｱﾛｸﾞ

GISｴｸｽﾎﾟｰﾄに失敗するとこのﾀﾞｲｱﾛｸﾞが現れます。

その原因となる可能性のあるものが以下の表に示されています。


｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞ－ﾄﾗﾌﾞﾙｼｭ－ﾃｨﾝｸﾞ
｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞ－ﾄﾗﾌﾞﾙｼｭｰﾃｨﾝｸﾞ

装置ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に､ﾌｧｲﾙ内で参照されたｼﾞｵｲﾄﾞﾓﾃﾞﾙ名が座標系ﾃﾞｰﾀﾍﾞｰｽ（Current.csd）内のｼﾞｵｲﾄﾞﾓﾃﾞﾙ名と一致しない場合には､このﾀﾞｲｱﾛｸﾞが現れます。使用したいｼﾞｵｲﾄﾞﾓﾃﾞﾙを選びます。

このﾀﾞｲｱﾛｸﾞが表示された理由は､以下の1つです。


ﾌﾟﾘﾝﾀｰがありません。

Trimble Geomatics Office から印刷したり､図表を描いたりするには､ｺﾝﾋﾟｭｰﾀｰにﾌﾟﾘﾝﾀｰがｲﾝｽﾄｰﾙされている必要があります。

ﾌﾟﾘﾝﾀｰをｲﾝｽﾄｰﾙするには､

1.	ｽﾀｰﾄをｸﾘｯｸします。

2.	設定/ﾌﾟﾘﾝﾀを選択します。ﾌﾟﾘﾝﾀｳｨﾝﾄﾞｳが現れます。

3.	ﾌﾟﾘﾝﾀｰの追加をﾀﾞﾌﾞﾙｸﾘｯｸします。ｲﾝｽﾄｰﾙするための手順に従って､Microsoft Windows設定にﾌﾟﾘﾝﾀｰを追加します。

ﾌﾟﾘﾝﾀｰをｲﾝｽﾄｰﾙすれば､それを使用してTrimble Geomatics Office から印刷することができます。


｢測地ｸﾞﾘｯﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞ

ｲﾝﾎﾟｰﾄされたﾌｧｲﾙで参照される結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙ名が座標系ﾃﾞｰﾀﾍﾞｰｽ内のどの測地ｸﾞﾘｯﾄﾞﾌｧｲﾙとも一致しない場合には､このﾀﾞｲｱﾛｸﾞが現れます。

このﾀﾞｲｱﾛｸﾞを使用して､座標系内で使用されるのに一番適した結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙを選択します。

このﾀﾞｲｱﾛｸﾞが表示された理由は､以下の1つです。


Survey Controller(*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中のﾒｯｾｰｼﾞとﾀﾞｲｱﾛｸﾞ

Survey Controller (*.dc)ﾌｧｲﾙをTrimble Geomatics Office にｲﾝﾎﾟｰﾄする時､ｿﾌﾄｳｪｱはそのﾌｧｲﾙに関していくつかのﾁｪｯｸを行い､.dcﾌｧｲﾙとﾌﾟﾛｼﾞｪｸﾄ座標系が同一でない場合には警告を発します。

以下は､.dcﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に表示される可能性のあるﾒｯｾｰｼﾞとﾀﾞｲｱﾛｸﾞの一覧です。

ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に1つ以上のｴﾗｰが発生しました。

このﾌﾟﾛｼﾞｪｸﾄに定義された特徴･属性ﾌｧｲﾙは同一でありません。

このﾌﾟﾛｼﾞｪｸﾄに対して特徴･属性ﾌｧｲﾙは定義されていません。

ﾌｧｲﾙをｲﾝﾎﾟｰﾄできません。

｢標準投影定義｣ﾀﾞｲｱﾛｸﾞ

｢重複ﾎﾟｲﾝﾄ｣ﾀﾞｲｱﾛｸﾞ

｢ﾌﾟﾛｼﾞｪｸﾄ座標系｣ﾀﾞｲｱﾛｸﾞ

｢測地ｸﾞﾘｯﾄﾞの選択｣ﾀﾞｲｱﾛｸﾞ

｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞ


ﾒｯｾｰｼﾞ　｢ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に1つ以上のｴﾗｰが発生しました。｣

ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に､ｿﾌﾄｳｪｱが1つ以上のｴﾗｰを発見しました。

以下の1つを行います。

  ﾒｯｾｰｼﾞを却下し､ｴﾗｰﾒｯｾｰｼﾞを無視するには､いいえをｸﾘｯｸします。

  ｴﾗｰを表示するには､はいをｸﾘｯｸします。

標準HTMLﾋﾞｭｰｱにｲﾝﾎﾟｰﾄﾚﾎﾟｰﾄが表示されます。

ｴﾗｰを調べるためには､ｴﾗｰﾒｯｾｰｼﾞのﾘﾝｸをｸﾘｯｸするか､ｲﾝﾎﾟｰﾄﾚﾎﾟｰﾄのｴﾗｰｾｸｼｮﾝにｽｸﾛｰﾙします。

必要に応じて､ｴﾗｰを修正し､ﾌｧｲﾙをｲﾝﾎﾟｰﾄし直します。


ﾒｯｾｰｼﾞ　｢このﾌﾟﾛｼﾞｪｸﾄに定義された特徴･属性ﾌｧｲﾙは同一でありません。｣

Survey Controller (*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に､属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するために使用された特徴･属性ﾗｲﾌﾞﾗﾘかﾃﾞｰﾀ辞書ﾌｧｲﾙが､.dcﾌｧｲﾙで参照されたものとは異なることが発見されました。

以下の1つを行います。

.dcﾌｧｲﾙとﾌﾟﾛｼﾞｪｸﾄに共通な属性をｲﾝﾎﾟｰﾄするには､はいをｸﾘｯｸします。

.dcﾌｧｲﾙからﾎﾟｲﾝﾄだけをｲﾝﾎﾟｰﾄするためには､いいえをｸﾘｯｸします。

このﾒｯｾｰｼﾞが再び表示されるのを防ぐために､ﾌｨｰﾙﾄﾞで属性情報を収集するﾗｲﾌﾞﾗﾘが使用しているﾗｲﾌﾞﾗﾘと同一であることを確認します。


ﾒｯｾｰｼﾞ　｢このﾌﾟﾛｼﾞｪｸﾄに対して特徴･属性ﾌｧｲﾙは定義されていません。｣

属性情報を含むSurvey Controller (*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中に､Trimble Geomatics Office はこのﾌﾟﾛｼﾞｪｸﾄに対して定義された特徴･属性ﾗｲﾌﾞﾗﾘかﾃﾞｰﾀ辞書ﾌｧｲﾙを見つけることができませんでした。

以下の1つを行います。

測量ﾃﾞｰﾀのみをｲﾝﾎﾟｰﾄし､.dcﾌｧｲﾙからの属性情報を無視するには､OKをｸﾘｯｸします。

｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞ/特徴ﾀﾌﾞの属性に対して同じﾗｲﾌﾞﾗﾘを持つﾌﾟﾛｼﾞｪｸﾄを設定するためには､取消をｸﾘｯｸします。


｢ﾌｧｲﾙをｲﾝﾎﾟｰﾄできません。｣

ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中にｴﾗｰが発生し､その結果としてﾌｧｲﾙはｲﾝﾎﾟｰﾄされませんでした。以下のﾒｯｾｰｼﾞが現れます。

ﾌｧｲﾙ<ﾌｧｲﾙ名>をｲﾝﾎﾟｰﾄできませんでした。

ﾌｧｲﾙが他のｱﾌﾟﾘｹｰｼｮﾝで開いていないかをﾁｪｯｸしてみてください。（例､Survey Controller (*.dc)ﾌｧｲﾙがDC File Editorﾕｰﾃｨﾘﾃｨで開いているかどうか）そうでなければ､ﾌｧｲﾙが壊れている可能性があります。


特徴ｺｰﾄﾞ　－　概要

詳細

利用方法	ﾀﾞｲｱﾛｸﾞ	関連項目
概要

特徴ｺｰﾄﾞとは､何らかの処理を行うために一緒にｸﾞﾙｰﾌﾟ分けされる必要のあるﾎﾟｲﾝﾄの記録方法です。例えば､柵に沿って収集されたそれぞれのﾎﾟｲﾝﾄに｢柵｣とｺｰﾄﾞ付けることができるので､ｵﾌｨｽに戻ってから｢柵｣の特徴ｺｰﾄﾞを持つﾎﾟｲﾝﾄすべてを特定されたﾗｲﾝｽﾀｲﾙで連結することができます。

特徴ｺｰﾄﾞを使用して作業するには､以下を行うことが必要です。

特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)ﾌｧｲﾙの作成

Trimble Survey Controller にﾗｲﾌﾞﾗﾘの転送

TDS Survey Proにﾗｲﾌﾞﾗﾘの転送

ﾗｲﾌﾞﾗﾘ内の特徴ｺｰﾄﾞを使用してﾃﾞｰﾀを収集

Trimble Geomatics Office にTrimble Survey Controller(*.dc)ﾌｧｲﾙの転送

特徴ｺｰﾄﾞの処理

特徴･属性ﾗｲﾌﾞﾗﾘとは､一連の命令です。

新しいﾗｲﾌﾞﾗﾘを作成するには､Feature and Attribute Editor（特徴･属性ｴﾃﾞｨﾀ）ﾕｰﾃｨﾘﾃｨを使用します。必要な数だけﾗｲﾌﾞﾗﾘを作成することができます。特徴ｺｰﾄﾞが処理されると､ﾗｲﾌﾞﾗﾘ内の命令は選択されたﾃﾞｰﾀに何をするべきかをTrimble Geomatics Office に伝えます。特徴ｺｰﾄﾞﾌｨｰﾙﾄﾞの値が特徴･属性ﾗｲﾌﾞﾗﾘで特定された条件に一致すると､関連付けられたｱｸｼｮﾝが実行されます。

特徴･属性ﾗｲﾌﾞﾗﾘの詳細に関しては､Feature and Attribute Editor のﾍﾙﾌﾟを参照してください。


特徴ｺｰﾄﾞ　－　処理の順序

概要と詳細情報

現在選択されているすべての特徴ｺｰﾄﾞは処理されますが､使用する選択方法が処理の手順を決定します。

選択ｾｯﾄ

Survey Controller(*.dc)ﾌｧｲﾙがｲﾝﾎﾟｰﾄされると､選択ｾｯﾄが作成されます。それは､.dcﾌｧｲﾙと同じ名前を持ち､ﾌｨｰﾙﾄﾞでﾎﾟｲﾝﾄが収集された順番を記録しています。この選択ｾｯﾄを使用すると､特徴ｺｰﾄﾞが収集された順番で処理されます。

その他の選択方法

以下の1つを行うこともできます。

選択ﾒﾆｭｰからｺﾏﾝﾄﾞを選びます。

ﾎﾟｲﾝﾄをｸﾘｯｸします。

こういった方法では､ﾃﾞｰﾀが収集された順番で処理が行われないかもしれません。


特徴ｺｰﾄﾞ　－　頻出するｴﾗｰ

概要と詳細情報

特徴ｺｰﾄﾞの使用時に以下のような典型的なｴﾗｰが発生する可能性があります。

誤った選択ｾｯﾄの使用による不正な結合

特徴ｺｰﾄﾞに対してﾎﾟｲﾝﾄを選択するために､ﾃﾞｰﾀｲﾝﾎﾟｰﾄ中にｼｽﾃﾑによって作成された選択ｾｯﾄを使用せずに､ｸﾞﾗﾌｨｯｸ選択を使用（または､選択/すべてｺﾏﾝﾄﾞの使用）する時にに不正な結合が起こることがあります。

ﾉｰﾄ：ﾌｧｲﾙからｲﾝﾎﾟｰﾄされたｴﾝﾃｨﾃｨのすべては選択ｾｯﾄ内に保存されます。Survey Controller(*.dc)ﾌｧｲﾙの場合､選択ｾｯﾄはﾌｧｲﾙの内部ｼﾞｮﾌﾞ名に従って名付けられます。それは､作成された選択ｾｯﾄがｲﾝﾎﾟｰﾄされたﾎﾟｲﾝﾄの順番を保持するからです。.dcﾌｧｲﾙの場合には､これは測量作業が行われた順番を選択ｾｯﾄが保持することを意味します。

誤ったﾎﾟｲﾝﾄｺｰﾄﾞの脇にｺﾝﾄﾛｰﾙｺｰﾄﾞを置く

例: CURB1 LP ST

ここではﾎﾟｲﾝﾄは､縁石ﾗｲﾝ上にある街灯の観測です。縁石観測は､新しい縁石ﾗｲﾝの始まりです。街灯は､適切な記号で描写されるﾎﾟｲﾝﾄです。ST（開始）ｺﾏﾝﾄﾞは､それに従うﾎﾟｲﾝﾄｺｰﾄﾞ（ここでは街灯）に適用されます。これは､CURB1とﾗﾍﾞﾙ付けされた最後のﾎﾟｲﾝﾄからのﾗｲﾝが現在のﾎﾟｲﾝﾄに引かれ､それがｺｰﾄﾞ付けの目的ではないことを意味します。

ｺｰﾄﾞは以下のようであるべきです。: CURB1 ST LP､またはLP CURB1 ST

ST（開始）ｺﾏﾝﾄﾞを使用しない

これは､同じｺｰﾄﾞを持つﾎﾟｲﾝﾄ間（ﾗｲﾝが引かれるべきではないところ）に継続的ﾗｲﾝを引く結果をもたらします。


フィールドコード -概要
フィールドコード−概要

詳細な情報

利用方法

概要

フィールドコードはTrimble Geomatics Office に対して，フィールドに情報を挿入するよう指示する専用の命令です。また，ASCII インポート/エクスポートおよびカスタムレポート操作へデータベースのデータ転送をコントロールするため，フィールドコードが使用されます。フィールドコードは，いくつかの項目(見出し)にグループ分けされます。各見出しのリスト，および各フィールドコードの詳細についてはフィールドコードの詳細をご覧ください。

Trimble Geomatics Office は，フィールドコードを広い範囲に使用します。例えば，下の機能で使用されます。

新しいプロジェクトを作成する場合，プロジェクト詳細のプロジェクト名と日付

注釈

ラベル

カスタムのポイントラベル

ASCII インポート/エクスポート

レポート定義

フィールドコードは，常に1組の角括弧[]で囲まれます。'[]'内のすべての文字は使用可能なフィールドコードとして扱われ，フィールドコードに対応する値がある場合はそれで置き換えられます。

例えば，フィールドコード'[名前]'を使用してTrimble Geomatics Office に対し，データベースの各ポイントに名前ラベルをつけるよう，指示することができます。フィールドコード'[標高]'を追加して，ラベルに標高を追加することもできます。

例えば，設定[$座標系.ゾーン]は″California Zone 3 0403″を表示し，[特徴コード]は'樹木'を表示します。現在のコンピュータのシステム日付とか時間のような情報も[日付]および[時刻]を使用して出力することができます。

さらに，フィールドコード名前=[名前]標高=[標高]により，下のようなレポートを作成します。

名前=3397 標高=18.762

名前=3396 標高=18.702

名前=3432 標高=?

名前=3436 標高=16.372

フィールドコードを呼び出すには，フィールドコードを追加したいフィールドで右クリックします。フィールドコードが使用できる場合には，ショートカットメニューにフィールドオプションが表示されます。

構文

フィールドコードの構文は，3つの要素から構成されます。

[内容.名前:オプション]

内容要素を使用して，フィールドコード名からあいまいな表現をなくします。例えば，フィールドコード[名前]は，常に現在のポイントのポイント名をデータベースから表示します。フィールドコードを使用してプロジェクト名を表示したい場合，必ず，$プロジェクトを含んでいる必要があります(つまり，[$プロジェクト.名前]が必要)。そうでないと，現在のポイント名が返されます。

内容要素はオプションです。省略された場合，Trimble Geomatics Office は最もあたりまえな内容を想定します。

フィールドコードに含まれるオプションとしては通常，フィールドコードの修飾子が考えられます。この要素もまた必須ではありません。


フィールドコードの詳細

概要と詳細情報

フィールドコードはいくつかの見出しににグループ分けされます。


データベースフィールドコード

概要と詳細情報

データベースのフィールドコードにより，収録した値，計算した値の両方をデータベースから直接出力することができます。オプションでデータベースのフィールドコードの前にテーブル名をつけることにより，そのデータを引き出します。

例えば，[ポイント.東距]はポイントテーブルから東距の値を引き出します。単純に[東距]とだけ指定すると，東距フィールドを有するのはポイントテーブルだけである場合に限り，同じようにポイントテーブルから東距を引き出します。不確かな場合はテーブル名を指定してください。

使用できるフィールドコードは内容に依存します。有効な名前は内容に依存しますが，データベーステーブルに関連するフィールドコードは：

データベースフィールドコード

データベースのフィールドの値は，データベースから直接取り出されます(例えば，東距)。

計算されたフィールドコード

下のテーブルに有効な計算されたフィールドコードを示します。

$中心{<区切り文字>}

円弧には，特別に$中心フィールドコードがあります。これは中心点の名前(データベースのポイントが使用されている場合)，または中心点の座標を表示します。

座標の値の間を表示する区切り文字を指定することができます。区切り文字が省略された場合，Microsoft Windows  のコントロールパネル/地域のオプションの'区切り記号'文字を使用します。

最初の縦列

最初の縦列(東距または北距)の値は出力の順序に依存します。

2番目の縦列

2番目の縦列(東距または北距)の値は出力の順序に依存します。

最初の縦列名

最初の縦列(東距または北距)の名前は出力の順序に依存します。

2番目の縦列の名前

2番目の縦列(東距または北距)の名前は出力の順序に依存します。


システムフィールドコード

概要と詳細情報

システムフィールドコードにより，たくさんのシステムに関する詳細，特殊な機能を呼び出すことができます。システムフィールドコードを使用して，レポートに追加情報を追加します。

ノート：各システムフィールドコードの頭には$システムが付けられます。例えば，[$システム.時刻]はフィールドコードが使用されたときのコンピュータの時間を表示します。

フィールドコードの前に$システムをつける必要がなくても，これを付けてあいまいな表現を避けます。例えば，[時刻]は[$システム.時刻]と同じ値を表わします。

時刻

フィールドコードが使用されたときのコンピュータの時刻を表示します。

日付

フィールドコードが使用されたときのコンピュータのシステム日付を表示します。

概要

'現在のエンティティ'の概要を表示します。

ノート：ポイントに使用される概要フィールドコードは，プロジェクトに割り当てられたOptions.ini ファイルに定義されます。通常，名前と特徴コードのフィールドコードを使用して[名前]:[特徴コード]となります。

スペーす。<スペース数>

1つ以上のスペースを表示します。

例えば，フィールドコード[$システム.スペーす。3]は3つのスペースを表示します。

リピート<繰り返す文字列>:<コピー数>

テキストを繰り返し表示します。繰り返したいテキストは，必ずカギ括弧(< >) で囲ってください。

例えば，フィールドコード  [$システム.リピート<->:80] は80個のマイナス文字を表示します。詳細については，パラメータ登録画面 をご覧ください。

列:<列数>

行の現在置から指定されたカラムまでのスペースを表示します。

例えば，フィールドコード[$システム.列:40]は現在の行が40カラムになるまでスペースを挿入します。

置換<検索文字列><置換文字列>

すべての'検索'テキストを'置換'テキストで置き換えます。検索や置換を行うフィールドの後ろに置換<検索文字列><置換文字列>フィールドコードが必要です。もし置換フィールドコードが検索して置換したいフィールドより前にある場合，そのフィールドは変更されません。

置換テキストはオプションです。省略した場合，'検索'テキストは行から削除されます。

例えば，フィールドコード[$システム.置換<ｰ><度>]の場合，現在の行から度の記号をすべて検索し，それを'度'で置き換えます。

文字:文字コード

指定された文字コードの文字を挿入します。

ノート：出力される文字は使用されているフォントに依存します。

例えば，フィールドコード[$システム.文字:169]はほとんどのフォントの場合，ｩを出力します。

ユーザ名

ネットワークにログインしているユーザ名を表示します。

コンピュータ名

ネットワークのID を表示します。Microsoft Windows のコントロールパネル/ネットワークでこのID を変更することができます。

情報

製品名とバージョンを表示します。

例えば，Trimble Geomatics Office，バージョン1.00 です。

ディレクトリ名

いろいろなフィールドコードを使用して，特定のシステムに関係するフォルダー名を出力することができます。

出力できるディレクトリ名は：

ASCII エクスポート

ASCII エクスポートでだけ使用できるフィールドコードが2つあります。

カウンター	使用されたフィールドコード数を出力します。エクスポートされる各値を認識するため使用できます。
ライン	エクスポートファイルの行番号を出力します。これにより，各行に行番号のあるASCII ファイルを定義できます。


パラメータ入力ダイアログ

警告：Trimble Navigation Limited は弊社が開発したTrimble Geomatics Office を使用して行ったこのデータベースの使用・変更のみをサポートします。は他のソフトウェアアプリケーションを使用して行ったこのデータベースの使用・変更についてはサポートも認可もしません。また，そのパフォーマンスについて保証しません。

このダイアログは，値を入力して選択クエリーやフィールドコードを完了する必要がある場合，表示されます。パラメータを必要とするクエリー，およびフィールドコード((�)という表示があります)を選択します。このダイアログはTrimble Geomatics Office のいろいろなところで表示されます。

名前

定義するパラメータを表わします。

値

必要な値を入力します。

パラメータ入力ダイアログは，データベースクエリーの結果に基づくデータベースレポートを作成する場合，表示されます。


プロジェクトフィールドコード

概要と詳細情報

プロジェクトフィールドコードは，特定のプロジェクト情報を出力します。これらのフィールドコードを使用して，レポートに追加情報を追加します。

ノート：各プロジェクトフィールドコードの頭には$プロジェクトが付けられます。例えば，[$プロジェクト.投影]はプロジェクトで使用されている座標系投影タイプの名前を表わします。

フィールドコードの頭に$プロジェクトを付ける必要がない場合でも，これを付けてあいまいな表現を避けます。たとえば，[名前]は[$プロジェクト.名前]を表わします。

名前

プロジェクトに使用しているプロジェクト名を表わします。

パス

プロジェクトが保存されるフォルダー名を表わします。

ノート：このフィールドコードは$システム.プロジェクトディレクトリと同じ内容を出力します。

投影

プロジェクトに使用している座標系投影タイプの名前を表わします。例えば，横メルカトール。

自動命名

現在の自動ポイント名を表わします。

例えば，前に割り当てられたポイント名がAUTO 0008 の場合，AUTO 0009 が返されます。

CAD レイヤー

現在のCAD レイヤー名を表わします。

単位:タイプ

適切な単位名を表わします。必ずタイプを指定してください。

ノート：距離，標高，座標，角度が使用できます。

例えば，フィールドコード[$プロジェクト.単位:距離]はシステムにセットされている距離を表わします。名前に':冗長'を追加すると，フィールドコードの値全体を得られます。例えば，'m'でなく'メートル'を得るには[$プロジェクト.単位:距離:冗長]を使用します。

タイプ:距離

距離の表示タイプを表わします。ファイル/プロジェクトプロパティ/単位，およびプロパティで設定できます。

タイプ:LLH

緯度，経度，高度(ローカル，またはWGS-84 )の表示タイプを表わします。


ヘディングフィールドコード

概要と詳細情報

ヘディングフィールドコードによりプロジェクトプロパティダイアログのプロジェクト詳細タブにあるプロジェクトヘディングフィールドのデータレコードにアクセスします。これらのフィールドコードを使用してレポートに追加情報を追加します。

ノート：これらの各ヘディングフィールドコードは頭には$ヘディングが付けられます。例えば，[$ヘディング.タイトル]は現在のプロジェクトのタイトルを表わします。

ヘディングに何か変更があると，使用できるヘディングフィールドコードはこれを反映するよう変化します。

これらのフィールドコードの頭に$ヘディングをつける必要がない場合でも，これをつけてあいまいな表現を避けます。

標準のヘディングフィールドコードは：

タイトル

現在のプロジェクトのタイトルを表わします。

説明

プロジェクトの説明を表わします。

リファレンス

プロジェクトのリファレンス番号を表わします。プロジェクトとオフィスの原価計算をリンクできます。

測量士

このフィールドコードの出力は後日，参照するのに便利です。

コンピュータオペレータ

このフィールドコードの出力は後日，参照するのに便利です。

日付

プロジェクトを作成した日付を表わします。これはテンプレートプロジェクトの日付フィールドコードを使用して自動的に作成されます。

垂直測地系

プロジェクトの垂直測地系を表わします。

機器

機器のシリアル番号を表わします。


座標系フィールドコード

概要と詳細情報

座標系フィールドコードにより，プロジェクトの座標系の特定の詳細情報を呼び出します。これらのフィールドコードを使用して､レポートに追加情報を追加します。

ノート：各座標系フィールドコードの頭には$座標系が付けられます。例えば，[$座標系.システム]はプロジェクトに使用される座標系の名前を表わします。

これらのフィールドコードの頭に$座標系をつける必要がなくても，これをつけてあいまいな表現を避けます。

ノート：設定が使用されていない場合，$座標系フィールドコードは'選択されていません'を返します。

システム

プロジェクトに使用されている座標系の名前を表わします(例えば，Japanese State Plane )。

ゾーン

プロジェクトが使用している座標系のゾーンの名前を表わします(例えば，Zone 9 )。

測地系

座標系の投影が基準としている測地系の名前を表わします(例えば，Japanese Standard )。

ジオイド

プロジェクトで使用されているジオイドモデルの名前を表わします(例えば，EGM96 (Global))。

サイト

プロジェクトのサイト定義の名前を表わします。


投影フィールドコード

概要と詳細情報

プロジェクトフィールドコードにより，プロジェクトの座標系で使用されている投影の特定な詳細情報を呼び出します。このフィールドを使用して，レポートに追加情報を追加します。

ノート：各投影フィールドコードの頭には$投影が付けられます。例えば，[$投影.名前]はプロジェクトで使用される座標系投影の名前を表わします。

これらのフィールドコードの頭に$投影をつける必要がなくても，これをつけてあいまいな表現を避けます。

名前

投影タイプの名前を表わします(例えば，横メルカトール)。

他の投影フィールドコードは，プロジェクトで使用されている投影の実際のパラメータの値を返します。

ノート：すべてのフィールドコードがすべての投影タイプに使用できるわけではありません。つまり，常にすべてのフィールドコードが使用できるわけではない，ということです。フィールドコードの下のリストは，返ってくると考えられるすべての投影パラメータのリストです。どの投影がプロジェクトで使用されているかによって，適切なフィールドコードだけが値を返します。投影で使用されていないフィールドコードはすべて，'N/A' (適用なしを意味します)を返します。

下の各フィールドコードは，詳細な値を表わします。

偽北距

投影の偽北距の値。

偽東距

投影の偽東距の値。

偽標高

平面投影の原点の楕円体高の値。

原点高度

平面投影の原点の標高の値。

原点緯度

投影の原点の緯度。

原点経度

投影の原点の経度。

縮尺係数

投影の中央の縮尺係数( 単位あたり )。

方位角

オブリークメルカトールおよびR.S.O.投影のskew 方位定義のskew 方位角の値。

真北方向角

オブリークメルカトールおよびR.S.O.投影の原点周りのskew 真北方向角定義のskew 角度の値。

パラレル 1

ランベルト2標準緯線およびAlbers Equal Area Conic 投影の定義で使用される北標準緯線。

パラレル 2

ランベルト2標準緯線およびAlbers Equal Area Conic 投影の定義で使用される南標準緯線。

ポイント1 緯度，ポイント1 経度，ポイント2 緯度，ポイント2 経度

これらの4つのフィールドコードは，それを使用して定義される2つのポイント座標で定義されるオブリークメルカトールおよびR.S.O.投影で使用されます。


測地系フィールドコード

概要と詳細情報

測地系フィールドコードにより，プロジェクトの座標系で使用されている測地系の特定の詳細情報を呼び出します。これらのフィールドコードを使用して，レポートに追加情報を追加します。

ノート：各測地系フィールドコードの頭には$測地系を付けられます。例えば，[$測地系.方法]はプロジェクトに使用される測地系の変換方法の名前を表わします。

これらのフィールドコードの頭に$測地系をつける必要なくても､これをつけてあいまいな表現を避けます。

ノート：すべてのフィールドコードがすべての測地系タイプに使用できるわけではありません。つまり，常にすべてのフィールドコードが使用できるわけではない，ということです。フィールドコードの下のリストは，返ってくると考えられるすべての測地系パラメータのリストです。どの測地系がプロジェクトで使用されているかによって，適切なフィールドコードだけが値を返します。測地系で使用されていないフィールドコードはすべて，'N/A' (適用なしを意味します)を返します。

下の各フィールドコードは，詳細な値を表わします。

方法

使用されている測地系変換方法の名前(例えば，3パラメータ)。

偏差X

偏差X の値(3パラメータと7パラメータの測地系変換で使用されます)。

偏差 Y

偏差Y の値(3パラメータと7パラメータの測地系変換で使用されます)。

偏差Z

偏差Z の値(3パラメータと7パラメータの測地系変換で使用されます)。

回転X

回転X の値(7パラメータ測地系変換でのみ使用されます)。

回転 Y

回転Y の値(7パラメータ測地系変換でのみ使用されます)。

回転Z

回転Z の値(7パラメータ測地系変換でのみ使用されます)。

縮尺係数

7パラメータ測地系変換の縮尺係数の値は10万分の1(ppm )で表わされます。

楕円体名

プロジェクトで使用される楕円体の名前。

楕円体の扁平度

楕円体の扁平度。

長半径

楕円体の長半径。


キャリブレーションフィールドコード

概要と詳細情報

キャリブレーションフィールドコードにより，プロジェクトの座標系で使用されているGPS サイトキャリブレーションの特定な詳細情報を呼び出します。このフィールドを使用して，レポートに追加情報を追加します。

ノート：各キャリブレーションフィールドコードの頭には$キャリブレーションが付けられます。例えば，[$キャリブレーション.回転]はGPS サイトキャリブレーションの平面調整の回転の値を表わします。

これらのフィールドコードの頭に$キャリブレーションをつける必要がなくても，これをつけてあいまいな表現を避けます。

ノート：キャリブレーションフィールドコードは，GPS サイトキャリブレーションの平面・高度成分に関係する2つのグループに分けられます。該当する成分が計算されている場合，各グループのすべてのフィールドコードが使用できます。つまり，高度のキャリブレーション成分は座標系の高度のキャリブレーションが有効な場合，すべて使用できます。下のフィールドコードのリストは，返ってくると考えられるキャリブレーションパラメータのリストです。キャリブレーションで使用されていないフィールドコードはすべて，'N/A' (適用なしを意味します)を返します。

下の各フィールドコードは詳細な値を表わします。

垂直原点 北

高度調整の原点の北距の値。

垂直原点 東

高度調整の原点の東距の値。

垂直補正定数

原点の変換で適用される高度のシフト量。

垂直補正 北

調整において適用される北方向の単位あたりの高度補正。

垂直補正 東

調整において適用される東方向の単位あたりの高度補正。

水平原点 北

平面調整の原点の北距の値。

水平原点 東

平面調整の原点の東距の値。

水平変換 北

北方向に適用される平面変換の値。

水平変換 東

東方向に適用される平面変換の値。

縮尺係数

平面調整で適用される縮尺係数( 単位あたり )。

回転

平面調整で適用される回転。


特別フィールドコード

概要と詳細情報

特別フィールドコードにより，各種のコンピュータ全般の詳細情報，特殊な関数を呼び出します。このフィールドを使用して，レポートに追加情報を追加します。

$ファイル.ファイル名

このフィールドコードは指定されたファイルの内容を出力します。

ノート：いくつかのフィールドコード設定で使用されるコロンと矛盾するので，コロン(:)を使用してコンピュータのドライブを指定することはできません。ドライブを指定する必要がある場合は'ドライブ:'の変わりに<ドライブ>を使用してください。例えば，<C>はC ドライブを指定します。

Trimble Geomatics Office はいくつかの特別なフィールドコードを使用して標準的なディレクトリを返します。

$ホーム(TGOffice.exe がある場所)

$システム(TGOffice.exe がある$ホームの下にあるシステムディレクトリ)

$プロジェクト(現在のプロジェクトのディレクトリ)

例えば[$ファイル.<c>\temp\data.txt]または[$ファイル.$システム\myfile.txt]

ノート：また，ここで':展開'を使用することもできます。

$環境.変数

名前を付けられた環境変数を表わします。

$キー.キー

与えられたキーを使用して，.ini ファイル(またはレジストリ)から得たキーで文字列を表わします。

フィールドコード'名前'のフォーマットはキー{,セクション}{;パス}です。

セクションが省略された場合，'フィールドコード'が使用され，パスが省略された場合，$システムが想定されます。

パスは$ファイルと共に使用でき，また下のどのフィールドコードとでも開始できます。

$ホーム

$システム

$プロジェクト

ノート：パスが$プロジェクトだけの場合，プロジェクトの*.ini ファイルが使用されます。(options.ini が初めに，次にtgo_v150.ini が検査されます�これらは各プロジェクトに関連付けられた.ini ファイルです。)パスが$システムだけの場合，レジストリのTrimble Geomatics Office の部分が使用されます。

$テキスト.テキスト

入力したテキストを表わします。これはレポートに便利です。

例えば，[$テキスト.特徴コード:20]はその位置から20文字の幅のラベル'特徴コード'を表わします。


平面図フォーム定義フィールドコード

概要と詳細情報

平面図フォーム定義には，いくつかの特別なフィールドコードが用意されています。平面図フォーム定義でこれらを使用すると，平面図を詳しく設定することができます。

ノート：各平面図フォームフィールドコードの頭には$プロットが付けられます。例えば，[$プロット.縮尺]はプロットの縮尺を表わします。

これらのフィールドコードの頭に$プロットをつける必要がなくても，これを付けてあいまいな表現を避けます。

縮尺

プロットの縮尺を表わします。

原点の最初の列名

原点の最初の列の名前を表わします。例えば，ファイル/プロジェクトプロパティ/単位とフォーマット/座標順オプション設定が北からの場合，[$プロット.原点の最初の列名]は'北距'を表わします。

原点の2番目の列名

原点の2番目の列の名前を表わします。例えば，ファイル/プロジェクトプロパティ/単位とフォーマット/座標順オプション設定が北からの場合，[$プロット.原点の2番目の列名]は'東距'を表わします。

原点の最初の列

原点の最初の列の値を表わします。例えば，ファイル/プロジェクトプロパティ/単位とフォーマット/座標順オプション設定が北からの場合，[$プロット.原点の最初の列]はプロットの原点の北距の値を表わします。

原点の2番目の列

原点の2番目の列の値を表わします。例えば，ファイル/プロジェクトプロパティ/単位とフォーマット/座標順オプション設定が北からの場合，[$プロット.原点の2番目の列]はプロットの原点の東距の値を表わします。

原点N

プロットの原点の北距の値を表わします。

原点E

プロットの原点の東距の値を表わします。

回転

プロットに指定された回転の値を表わします。

平面図フォーム

平面図フォームの定義で指定された平面図フォームの名前を表わします。


修飾子

概要と詳細情報

フィールドコード修飾子は特別なコマンドです。このフィールドコードを使用してフィールドコードの出力を修飾できます。

修飾子を使用するには：

フィールドコードから必要な出力を選択する

データ出力時に追加フォーマット情報，または追加パラメータを適用する

1つのフィールドコードを修飾することができる修飾子はたくさんあります。たくさんの修飾子を使用する場合，通常，下のように指定されます。

	[フィールドコード{:フォーマット項目}{:フォーマット項目}{:フォーマット項目}{:フォーマット項目}]
フォーマット項目は修飾子名，またはフォーマットレイアウトです。注括弧はこれらがオプションの項目であることを示します。

修飾子を指定する時，大文字でも小文字でもその混合でもかまいません。

使用できる修飾子は下の通りです。

幅 の値 ( 数値 )

フィールドコードからの出力の幅を指定します。幅の値がマイナスの場合，出力は左揃えになり，それ以外は右揃えになります。

例えば，特徴コード="sample code"の場合，[特徴コード:15]は"特徴コード"(つまり，4文字のスペースをはじめに追加して15文字の幅にします)。

幅.小数点 の値 ( 数値 )

フィールドコードの出力の幅と小数点以下の桁数の両方を指定します。修飾子はW.Dになります。W は幅で，D は小数点以下の桁数です。

幅の値がマイナスの場合，フィールドは左揃えになり，それ以外は右揃えになります。

幅の値がゼロで始まるけれどゼロではない場合(例えば，08.3 )，スペースでなくゼロでその幅が埋められます。

例えば	標高 = 10.3258 の場合

[標高:0.3] は 10.326 を表わします。

[標高:07.2] は 0010.33 を表わします。

単位

値の後ろに単位をつけます。例えば，メートルにはm，国際フィートにはift，US測量フィートにはsft です。この修飾子を使用して，ファイル/プロジェクトプロパティ/単位とフォーマットタブがいいえに設定されていても，表示単位を出力することができます。

単位なし

値の後ろに単位をつけません。この修飾子を使用して，ファイル/プロジェクトプロパティ/単位とフォーマットタブがはいに設定されていても，表示単位を出力しないことができます。

大文字

すべてのアルファベット文字を変換します。フィールドコードから大文字で返されます。

小文字

すべてのアルファベット文字を変換します。フィールドコードから小文字で返されます。

右

指定されたフィールド幅にフィールドコードからの出力を右揃えにします。フィールド幅が指定されていない場合，文字揃えは実行されません。

左

指定されたフィールド幅にフィールドコードからの出力を左揃えにします。フィールド幅が指定されていない場合，文字揃えは実行されません。

中央

指定されたフィールド幅にフィールドコードからの出力を中央揃えにします。フィールド幅が指定されていない場合，文字揃えは実行されません。

例えば，特徴コード="Example"の場合

[特徴コード:11:中央]は"Example  ".

つまり，この場合，はじめと終わりに2つずつスペースが付いて返されます。

短縮

与えられた幅に短縮します(幅がプラス/マイナスの場合，はじめ/終わり)。

例えば，特徴コード=Example  の場合

[特徴コード:4:短縮]は'Exam'を表わします。

[特徴コード:−4:短縮]は'mple'を表わします。

展開

'展開'が適用されるフィールドコードから返されたテキストにあるすべてのフィールドコードを展開します。

例えば，フィールドコード[$ファイル.$システム\text.txt:展開]がファイルのインポートで使用された場合，text.txt ファイルにある使用可能なすべてのフィールドコードを表示する前に展開します。

標準

出力を標準数値フォーマット(小数点はあるが桁区切り記号(1000の区切り文字)はない)に変換します。

ノート：この修飾子はレポート定義にのみ適用します。インポートルーチンは数値データを標準型(桁区切り記号はないが小数点はある)で受ける可能性も，Microsoft Windows のシステムで設定された桁区切り記号と小数点記号のある値を受ける可能性もあります。エクスポートルーチンは数値を変換して標準型で出力します。

反転

適切なフィールドコードの意味を反転します。例えば，[方位角:反転]は通常返される与えられたラインの方位角を反転します。

4分割

方位角を4分割した方向で表わします。例えば，方位角228ｰ37'25"はN81ｰ22'35"W と表わされます。

正円

方位角を正円の方向で表わします。例えば，方位角のフォーマットが4分割の方向で北81度22分35秒西と表わされている場合，228ｰ37'25"と表わされます。

冗長

適切な完全な言葉を使用します。例えば，単位が'm'に省略されている場合，冗長修飾子を使用して'メートル'と表わします。

分割

文字列から小数点を除去します。

例えば，修飾子[標高:分割]により小数点のない標高を得られます。

ノート：注釈テンプレートを作成する場合，この修飾子はポイント上の注釈の位置に便利です。

この修飾子は'.'を1つのスペースに置き換えますが，例えば，:分割<3>を使用してスペースを追加することもできます。

整数部

値の小数部を除きます( '.' まで )。

小数部

値の整数部を除きます( '.' から )。

暗黙

数値に小数点がないが，その位置はわかっているASCII ファイルのインポート・エクスポートをコントロールします。修飾子は標準の幅.小数点修飾子との組み合わせで使用されます。

例えば，[北距:10.3:暗黙]は4853297.692 という北距の値を4853297692 と出力します。同じフィールドコード定義により，インポート時に小数点のない値の変換を正しく行います。


フォーマットレイアウト

概要と詳細情報

フォーマットレイアウトにより，フィールドコードを構築することができます。

例えば，フォーマットレイアウトのコンポーネントを使用して，日付のフィールドコードを構築できます。

[日付:<{DDDD}, {MMM} {D}-{YYYY}!>]

これはSunday,Oct 17 1999!になります。

ノート：フィールドコードにどんなテキストでも挿入することができます。例えば上の場合，エクスクラメーションマークが挿入されています。

フォーマットレイアウトは，常にカギ括弧(<>)(完全なフォーマットレイアウトを表わす)，または注括弧({})で囲まれている必要があります(フォーマットレイアウトのコンポーネントを表わす)。

フォーマットレイアウトは，特定のデータタイプにのみ適用します。それは：

日付フォーマットレイアウト

時刻フォーマットレイアウト

角度/方向フォーマットレイアウト

角度/方向が完全なフォーマットレイアウトを与えるのに対し，日付と時刻はフォーマットレイアウトのコンポーネントを与えます。


日付フォーマットレイアウト

概要と詳細情報

日付のフォーマットレイアウトは，フィールドコードの日付コンポーネントの表示をコントロールします。例えば，コンポーネントddを含む日付フィールドコードは，ゼロを含む日付を表わします。

ノート：数値で表示されているサンプルの日付フォーマットレイアウトが，ショートカットメニューのフィールド/詳細/続き/フォーマットレイアウトにあります。これらのサンプル日付レイアウトは，ここにリストされている詳細なフィールドコードを使用して自動的に変換されます。

日付フォーマットレイアウトの使用可能なタイプは，下のリストの通りです。


時刻フォーマットレイアウト

概要と詳細情報

時刻のフォーマットレイアウトは，フィールドコードの時刻コンポーネントの表示をコントロールします。例えば，コンポーネントhhを含む時刻フィールドコードは，ゼロを含む時間(12時間制)を表わします。

ノート：数値を使用して表示されているサンプルの時刻フォーマットレイアウトが，ショートカットメニューのフィールド/詳細/続き/フォーマットレイアウトにあります。これらのサンプル時刻レイアウトは，ここにリストされている詳細なフィールドコードを使用して自動的に変換されます。

時刻フォーマットレイアウトの使用可能なタイプは，下のリストの通りです。

ノート：フォーマットレイアウトの日時コンポーネントは，必ず，秒とミリ秒の前に分，分の前に時の順にし，最後にt  またはtt  を付けてください。これらのフォーマット項目を省略することは可能です。

日付，時刻コンポーネントは，日付フィールドコードにも，時刻フィールドコードにも使用できます；渡されたデータには，すべての情報が含まれています。コンポーネントで重要なのは，分(m )と月(M )を区別することです。

用例：

<DDDD,MMM D,YYYY!>は'Thursday,Oct 14 1999!'を表わしますこれは現在の日付です。

<hh mm sstt!>は'01 02 07pm!'を表わしますこれは現在の時刻です。


角度 -方向フォ-マットレイアウト
角度/方向フォーマットレイアウト

概要と詳細情報

角度/方向フォーマットレイアウトは，フィールドコードの角度/方向コンポーネントの表示をコントロールします。例えば，コンポーネント<dm.mm>を含む方位角フィールドコードは，方位を度と分の小数で表わします。

ノート：角度/方向フォーマットレイアウトは，ショートカットメニューのフィールド/詳細/続き/フォーマットレイアウトから使用できます。

角度/方向フォーマットレイアウトの使用可能なタイプは，下のリストの通りです。

秒の小数

度・分・秒の小数で角度/方向を表わします(角度の単位に度が設定されている場合)。このフォーマットレイアウトは，レイアウト文字<dms.ss>を挿入します。例えば，[方位角:0.3:<dms.ss>]は，秒の小数点以下が3桁の方位角の値を表わします。

分の小数

度・分の小数で角度/方向を表わします(角度の単位に度が設定されている場合)。このフォーマットレイアウトはレイアウト文字<dm.mm>を挿入します。例えば，[方位角:0.4:<dm.mm>]は，分の小数点以下が4桁の方位角の値を表わします。

度の小数

度の小数で角度/方向を表わします(角度の単位に度が設定されている場合)。このフォーマットレイアウトはレイアウト文字<d.dd>を挿入します。例えば，[方位角:0.6:<d.dd>]は，度の小数点以下が6桁の方位角の値を表わします。

符号付きの度の小数

符号付の度の小数で角度/方向を表わします(角度の単位に度が設定されている場合)。このフォーマットレイアウトは，レイアウト文字<+d.dd>を挿入します。例えば，[緯度<+d.dd>:0.8]は符号(+または−)を含む度の小数点以下が8桁の緯度の値を表わします。


フィールドコードの置換え

概要と詳細情報

フィールドコードの置換ではフィールドコード以外の特別な文字シーケンスをいくつか認識します。

用例：

タブ区切りのASCII 出力フォーマットを作成するには，下のフィールドコードを使用します。

[名前]\t[東距]\t[北距]\t[標高]\t[特徴コード]

1行に方位角と標高記述して2行に出力するには，下のフィールドコードを使用します。

[方位角]|[距離]


フィールドコードとASCII インポート

概要と詳細情報

インポートフォーマットに使用できるフィールドコードは：

ポイントテーブルのフィールドコードのみ。

サブレコード，システムフィールドコードは使用不可。

([$システム.リピート<検索><置換>]は例外で使用できます。)

いくつかの計算されたフィールドが使用できます(例えば，緯度/経度)。

$スキップ

($スキップ)はASCII インポートの変換を助ける特別なスコープです。

スペース

このフィールドコードは，幅で指定された数のスペースをスキップします。幅が指定されなかった場合は，スペースでないところまでスキップします。Trimble Geomatics Office が前のフィールドがどこで終わったかわかるよう，スキップの前にスペースがあることを確認してください。例えば：

[名前][$スキップ.スペース][北距][$スキップ.スペース][東距][$スキップ.スペース]

番号

このフィールドコードは数字(文字'+','−','.'&'0'...'9')をスキップします。幅が指定された場合，該当する文字をその数だけスキップします；あるいは，はじめの数字以外の文字をスキップします。

ノート：これはヌルや指数には効果がありません。

ライン

このフィールドコードは，幅で与えられた行数，または1行をスキップします。

テキスト

このフィールドコードは，与えられた文字数，または印刷できない文字(例えば，\n )までスキップします。

カラム

このフィールドコードは与えられたカラム数をスキップします。

終点：文字列

このフィールドコードは与えられた文字列の次の文字までスキップします(例えば，[$スキップ.終点:エンティティ])。

ノート：文字列には新しい行は含められません。

いくつか特別な'フォーマット関数'があります。

標準

このフォーマット関数は，標準数値からの入力を変換します。'.'は小数点として変換されます。

スキップ

このフォーマット関数は，フィールドを普通に読み込みますが保存しません(例えば，[ポイント.水平精度:10.3:スキップ])。

= ( 等号 )

このフォーマット関数は，フォーマット文字列のあとの部分を使用してフィールドの値を割り当てます。ファイルのチェックは行われません(例えば，[特徴コード:=インポート])。このようなフィールドは，フィールドコード定義文字列のはじめにある必要があります(そうでないとparsing が混乱します)。例えば，'[標高:=0.0][名前],[北距],[東距]'

ノート：ASCII インポートファイルフォーマットの定義をするとき大切なのは，フィールドコードに幅を指定すること(例えば，[WGS 緯度:11])，またはフィールドコード間の区切り文字を指定すること(例えば，[WGS 緯度],[WGS 経度],[WGS 高度]のカンマが'フィールド'の終わりを示しています)です。これは，インポートルーチンがASCII ファイルから値をインポートするとき，フォーマット定義を使用して，与えられたデータベースフィールドに読み込まれるファイルの各行の部分をうまく変換するためです。幅，あるいは区切り文字により，ファイルの行から適切な部分の位置がわかります。

ノート：ミリ秒のイベント時刻を表示するには，次のフォーマットレイアウトをフィールドコードに追加してください，<H:mm:ss.nnn>，nnn は秒の小数以下の桁数です。例えば，[ポイント観測.時刻:<H:mm:ss.nnn>]。時刻精度を高くするには，秒の小数以下を増やしてください。例えば，nnnn は秒の小数以下4桁を出力します。


フィールドコードパラメータダイアログ

このダイアログを使用して，フィールドコードを完成します。ダイアログのタイトルは内容を示します。

名前

このカラムは指定されるパラメータを表わします。

値

必要な値を入力します。


ファイルをTrimble Survey Controller に転送　‐　概要

詳細情報

利用方法	ダイアログ
概要

フィールドで必要なファイルをTrimble Survey Controller に送信できます。これを行うには，Data TransferユーティリティでSurvey Controller を設定する必要があります。

下のタイプのファイルを転送できます。

アンテナファイル

測地グリッドファイル(*.cdg)

データコレクタファイル(*.dc)

データ辞書ファイル(*.ddf)

DTM ポイント

特徴・属性ライブラリ(*.fcl)

ジオイドグリッドファイル(*.ggf)

UK National グリッドファイル(*.pgf)

CSV ファイル

背景地図ファイル


アンテナの詳細をSurvey Controller へ転送オプション
アンテナの詳細をSurvey Controller へ送信オプション

アンテナファイルのアンテナ情報を編集した場合，このオプションを使用してこの情報をTrimble Survey Controller へ転送します。

Trimble Survey Controller  バージョン6.00以降，アンテナの詳細はAntenna.ini ファイルに保存されます。

Trimble Survey Controller  バージョン5.03以前，アンテナ情報はAntenna.dat ファイルに保存されます。

ノート：アンテナ詳細をエクスポートするには，適切なアンテナファイルがProgram Files\Common Files\Trimble\Config フォルダにある必要があります。


Survey Controller ファイル(*.dc)オプション

Survey Controller (*.dc)ファイルはTrimble Geomatics Office とTrimble Survey Controller 間をリンクします。これらのファイルはTrimble Survey Controller からジョブをインポートしたとき，またはTrimble Geomatics Office プロジェクトをこのフォーマットにエクスポートした場合に作成されます。

Trimble Geomatics Office を使用すると、以下のことができます。

Survey Controller ファイル(*.dc)をインポート

Trimble Geomatics Office プロジェクトをSurvey Controller ファイル(*.dc)フォーマットへエクスポートし，その後Survey Controller ソフトウェアへ転送

Survey Controller ファイル(*.dc)をインポートするには､

1.	ファイル/インポートを選択します。インポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller ファイル(*.dc)オプションを選択します。開くダイアログが表示されます。

4.	インポートしたいファイルをフォルダから選択し，開くをクリックします。

現在のTrimble Geomatics Office プロジェクトをSurvey Controller ファイル(*.dc)へエクスポートするには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller ファイル(*.dc)オプションを選択します。

4.	オプションをクリックしてデータコレクタオプションダイアログを開き，ファイルの内部的な名前とSurvey Controller ファイルのバージョンを指定します。

5.	OKをクリックして設定を確定し，エクスポートダイアログに戻ります。

6.	OKをクリックします。名前を付けて保存ダイアログが表示されます。

7.	ファイルを保存したいフォルダを選択します。

8.	標準ではファイル名はプロジェクト名を使用します。ファイル名フィールドに名前を入力して変更し，保存をクリックしてください。


Survey Controller オプション

Trimble Geomatics Office を使用してデータを直接，Trimble Geomatics Office プロジェクトとTrimble Survey Controller 間で転送できます。Trimble Survey Controller からジョブがインポートされたとき，Trimble Geomatics Office で使用されるSurvey Controller ファイル(*.dc)フォーマットに変換されます。

Trimble Geomatics Office を使用して､

Trimble Survey Controller からジョブをインポート

Trimble Geomatics Office プロジェクトをTrimble Survey Controller へエクスポート

このオプションを呼び出すには，下の1つを行います。

Survey Controller ジョブをTrimble Geomatics Office プロジェクトへインポートするには､

1.	ファイル/インポートを選択します。インポートダイアログが表示されます。

2.	測量タブを選択します。

3.	測量機オプションを選択してOK をクリックします。データ転送(Data Transfer )の開くダイアログが表示されます。

Trimble Geomatics Office プロジェクトをSurvey Controller へエクスポートするには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	測量機オプションを選択します。

4.	オプションをクリックしてデータコレクタオプションダイアログを開き，ファイルの内部的な名前とSurvey Controller ファイルのバージョンを指定します。

5.	OKをクリックして設定を確定し，エクスポートダイアログに戻ります。

6.	OKをクリックします。名前を付けて保存ダイアログが表示されます。

7.	Survey Controller を選択します。

8.	開くをクリックします。コンピュータはTrimble Survey Controller へ接続します。

9.	メインメモリ，またはSurvey Data Card オプション(あれば)を選択します。

10.	開くをクリックします。ソフトウェアは選択されたフォルダを読み込み，フォルダにあるすべてのTrimble Survey Controller ジョブを表示します。

11.	ファイル名フィールドに新しい.dc ファイルの名前を入力します。

12.	保存をクリックして.dc ファイルを作成し，Trimble Survey Controller へ転送します。

ノート：データをバージョン7.60 Survey Controller へ/からデータを転送するとき，バージョン7.5 dc ファイルフォーマットを使用します。


デ-タコレクタオプションダイアログ
デ－タコレクタオプションダイアログ

このダイアログを使用して，データをエクスポートする装置のタイプを指定します。

このダイアログを呼び出すには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	下のオプションの1つを選択します。

DTM ポイントファイル

Survey Controller へDTM ポイント

Survey Controller へ特徴・属性ライブラリ

SDR ファイル

Survey Controller

Survey Controller ファイル

4.	オプションをクリックします。

ノート：使用できるフィールドは選択されているオプションに左右されます。

バージョン

データフォーマットに関係するバージョンを選択します。

ジョブ/ファイル名

エクスポートするジョブの名前，またはファイルタイプを表示します。ジョブをエクスポートするとき，Trimble Geomatics Office プロジェクトの名前が標準で入力されます。キーボードからファイルの新しい名前を入力できます。

特徴・属性出力

このチェックボックスを選択して，プロジェクトで使用されている特徴・属性ライブラリ，エクスポートするプロジェクトでポイントに割り当てられているすべての特徴，および属性の情報をエクスポートします。このオプションはSurvey Controller バージョン7.00 以上で使用できます。

ラインと円弧のエクスポート

このチェックボックスをオンにすると、プロジェクトで使用されたラインと円弧をTrimble Survey Controller にエクスポートできます。このオプションは、ラインと円弧が選択セットに含まれており、かつTrimble Survey Controller 10.00 以降である場合にのみ利用できます。

出力形式

装置ファイルに出力するポイントを選択します。

WGS-84，またはグリッドの座標で出力できます。選択しているデータフォーマットとバージョン，座標系データベースの定義によっては，両方のオプションが使用できるとは限りません。例えば。Trimble Survey Controller  バージョン4.00 より以前ではWGS-84 座標，Sokkia SDR20 バージョンではグリッド座標しか選択できません。

プロジェクトの座標系がTrimble Survey Controller ファイルへのデータ出力に影響するかもしれません。測地グリッド(例えば，NAD83 HPGN，NADCON )，多重回帰測地系変換方法はTrimble Survey Controller  バージョン6.50以前ではサポートされていません。Trimble Survey Controller  バージョン7.00 以降で測地グリッドをサポートします。

サポートされていない測地系変換方法がプロジェクトで指定されているデータをTrimble Survey Controller へエクスポートする場合，作成された.dc ファイルの測地レコードはなしに設定されます。正しくないグリッド座標がTrimble Survey Controller に表示されるかもしれません。詳しくは，測地系変換方法とTrimble Survey Controller トピックスをご覧ください。

同様に，Trimble Survey Controller  バージョン4.00 ではジオイドモデルを使用できません。プロジェクトでジオイドモデルを使用している場合，測地系変換方法は同じく，なしに設定されます。これは，Trimble Survey Controller  バージョン4.00 が誤ったデータを表示できないことを意味します。

フィールドで転送されたグリッド座標データを使用するには，グリッドデータと観測されたGPS データを関係付けるフィールドでのキャリブレーションを行う必要があります。詳しくは，ジオイドモデルとSurvey Controllersトピックスをご覧ください。

ファイル詳細

追加するファイルチェックボックスを選択して，既存の.dc ファイルからエクスポートにデータを追加できます。参照ボタンが使用可能になります。参照をクリックして新しいファイルに追加したい.dc ファイルの場所を指定します。そして，現在のプロジェクトからのデータが新しいファイルに追加されます。

このオプションは，エクスポートするデータに追加したい基準点を含む.dc ファイルがある場合に便利です。このオプションは.dc ファイルの元の状態はそのまま保ちます。


データコレクタの単位

Trimble Survey Controller ファイル(.dc)，またはSDR フォーマットファイルがインポートされると，ファイルヘッダの単位定義が単位変換のために使用されます。Trimble Geomatics Office は常に，内部的なSI(メートル)データを操作するため、装置ファイルからインポートされたデータは適切に変換されます。

値が画面にどう表示されるか選択するには､

1.	ファイル/プロジェクトプロパティを選択します。

プロジェクトプロパティダイアログが表示されます。

2.	単位とフォーマットタブを選択します。

このタブを使用して表示単位を選択します。

ノート：SDR ファイルにはフィート，メートルの距離単位しかありません。SDR ファイルに関して，座標の単位がUS 測量フィートに設定されている場合，フィートの値はUS 測量フィートの値として変換されます。


DC ファイル属性ノート(Survey Controller V4 )オプション

属性ノートファイルは単純なカンマ区切りファイルです。ファイルには，Trimble Survey Controller (バージョン3.00 または4.00 )が動作している装置で属性ノートとして収集されたポイント属性があります。このオプションは，特徴・属性ライブラリを使用して収集された属性(Trimble Survey Controller  バージョン7.00以降で使用可能)をエクスポートしません。

このオプションを使用して，ノートレコードを使用して収集された属性のみ，エクスポートします。

手順は､

1.	Trimble Survey Controller  バージョン3.00 または4.00 の属性ノートを含むファイルをTrimble Geomatics Office プロジェクトにインポートします。

選択セットがTrimble Geomatics Office によって作成されます。この選択セットは，ファイル内部のジョブ名と同じ名前になります。

2.	作成された選択セットを選択します。選択セットはプロジェクトから属性ファイルのポイントを読み込むため，使用されます。

3.	属性ノートつきの.dc ファイルをエクスポートします。

作成されるファイルの例：

1000,5315.362,1056.274,82.361,TREE,TYPE,PINE,HEIGHT,25,GIRTH,0.5

1001,5382.728,1132.692,75.472,TREE,TYPE,BIRCH,HEIGHT,20,GIRTH,0.4

1002,5298.048,1162.472,55.927,PP,VOLTAGE,110KV,CABLES,3

1003,5308.682,1192.329,62.854,PP,VOLTAGE,110KV,CABLES,3


Survey Controller へDTM ポイントオプション

このオプションを使用して，DTM ポイントをTrimble Survey Controller が動作している装置に転送します。

これを行うには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へDTM ポイントオプションを選択します。

4.	オプションをクリックして，エクスポートするファイル名とSurvey Controller ソフトウェアのバージョンを指定します。

5.	OKをクリックして設定を確定し，エクスポートダイアログへ戻ります。

6.	OKをクリックします。データ転送(Data Transfer )の名前を付けて保存ダイアログが表示されます。

エクスポートに選択されたポイントは，規則正しくグリッドに区切られたポイントでなければなりません。つまり，北から南，東から西へ，各方向のポイントは同じ間隔でグリッドを形成している必要があります。一般に，グリッドポイントは座標のASCII ファイルからシステムへインポートされます。規則正しいグリッドポイントだけがエクスポートに選択され，グリッドの外のポイントは現在の選択にないことを確認してください。

いったん，エクスポートオプションが選択されると，Trimble Geomatics Office システムは選択されたグリッドポイントを適切な順に並べ替え，Trimble Survey Controller で必要な特別なフォーマットのファイルを作成します。


DTM ポイントファイル(*.dtx)オプション

このオプションを使用して，DTM ポイントをデジタル地形モデルファイル(*.dtx)へエクスポートします。

これを行うには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	DTM ポイントファイル(*.dtx)オプションを選択します。

4.	オプションをクリックして，エクスポートするファイルの名前とSurvey Controller ソフトウェアバージョンを選択します。

5.	OKをクリックして設定を確定し，エクスポートダイアログに戻ります。

6.	OKをクリックします。名前を付けて保存ダイアログが表示されます。

7.	ファイルの名前を入力し，保存するフォルダを選択します。

8.	OKをクリックします。

エクスポートに選択されたポイントは，規則正しくグリッドに区切られたポイントでなければなりません。つまり，北から南，東から西へ，同じ間隔でグリッドを形成している必要があります。一般に，グリッドポイントは座標のASCII ファイルからシステムへインポートされます。規則正しいグリッドポイントだけがエクスポートに選択され，グリッドの外のポイントは現在の選択にないことを確認してください。

いったん，エクスポートオプションが選択されると，Trimble Geomatics Office システムは選択されたグリッドポイントを適切な順に並べ替え，デジタル地形モデル(*.dtx )フォーマットのファイルを作成します。


Survey Controller へ測地グリッド(*.cdg)オプション

詳細情報

関連項目

このオプションを使用して､Trimble Survey Controllerへ転送する結合測地グリッドファイルを作成します。

これを行うには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へ測地グリッド(*.cdg)オプションを選択します。

測地グリッドエクスポートダイアログが表示されます。

測地グリッドファイルは，定義されたエリアの測地グリッド変換を保存しています。Trimble 座標系変換マネージャ�ユーティリティを使用して，システムの測地系変換として測地グリッドファイルを使用する座標系を定義できます(例えば，NADCON )。そして，Trimble Geomatics Office プロジェクトに測地グリッドを使用する測地系を選択できます。測地グリッドファイルをフィールドで使用するには，測地グリッドファイルを結合測地グリッドファイルとしてTrimble Survey Controller (バージョン7.00以降)に転送する必要があります。Trimble Survey Controller の各バージョンに使用できる測地系変換方法に関する詳細な情報は，測地系変換とSurvey Controllersトピックスをご覧ください。

選択された測地グリッドの緯度グリッドファイルと経度グリッドファイルがProgram Files\Common Files\Trimble\Geodataサォルダにあなます。これらのファイルは，Trimble Survey Controller へ転送する前に結合する必要があります。Survey Controller へエクスポートする結合測地グリッドファイルを作成しますを選択すると，ソフトウェアはプロジェクトの測地系で指定された測地グリッドに割り当てられたファイルを結合します。

結合測地グリッドを作成し，Trimble Survey Controller で使用するとき，元の測地グリッドの名前が.dc ファイルに保存されます。例えば，NADCON (HPGN)。

その.dc ファイルをTrimble Geomatics Office へインポートする場合，この名前を使用して，フィールドで使用した座標系がTrimble Geomatics Office プロジェクトで定義された座標系と一致しているか判断します。

ノート：結合測地グリッドファイルは，現在使用している測地グリッドファイルからのみ作成できます。しかし，どの結合測地グリッドでもエクスポートはできます。

下のことが可能です。

既存の結合測地グリッド(.cdg)ファイルを転送

新しい結合測地グリッド(.cdg)ファイルを作成しTrimble Survey Controller へ転送

ノート：Trimble グリッドファクトリユーティリティを使用して測地グリッドファイルを結合することもできます。グリッドファクトリをインストールするには，Trimble Geomatics Office カスタムインストールオプションを使用します。


測地系変換とTrimble Survey Controllers

Trimble Geomatics Office は，測地系変換の測地グリッドと多重回帰定義をサポートします。

この測地系変換方法を使用している多くの座標系定義が，ソフトウェアといっしょに提供される座標系データベースに用意されています。

Trimble Survey Controller  バージョン7.00 より以前のバージョンは，これらの測地系変換タイプをサポートしていません。Trimble Survey Controller  バージョン7.00 は測地グリッドをサポートしています。

Trimble Geomatics Office は下のものを作成できません：

これらの測地系変換方法のいずれかを基本にするTrimble Survey Controller バージョン6.50 以前の.dc ファイル

多重回帰測地系変換を基本にするTrimble Survey Controller バージョン7.00 の.dc ファイル

サポートされていない方法を使用しているプロジェクトからのポイントがTrimble Survey Controller .dc ファイルにエクスポートされた場合，Trimble Geomatics Office は測地系レコードの方法をなしに設定します。

これは，Trimble Survey Controller がポイント表示をWGS-84 とグリッドの座標間で切り替えられないことを意味します。同様に，そのポイントを使用して作業を行えるようなグリッド座標がすべてのフィールド作業の前にある場合，フィールド作業においてキャリブレーションを行う必要があります。

グリッド座標がキャリブレーションのために転送されるのはかまいません。WGS-84 の位置が転送される場合，すぐに設定をはじめられます。しかし，フィールドでキャリブレーションが行われない限り，グリッド座標は表示できません。


測地グリッドエクスポートダイアログ

このオプションを使用して，測地グリッド(*.cdg)ファイルをエクスポートします。

このダイアログを呼び出すには､

1.	ファイル/エクスポート選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へ測地グリッド(*.cdg)オプションを選択します。

4.	OKをクリックします。

Survey Controller へ測地グリッド(*.cdg)オプションを選択したとき，測地グリッドエクスポートダイアログが表示されます。

既存結合測地グリッドファイルをSurvey Controller へエクスポート

このオプションを選択して，結合測地グリッドファイルをTrimble Survey Controller (バージョン7.00 以降)へエクスポートします。GeoData フォルダにある既存の結合測地グリッドファイルをエクスポートするよう，選択できます。このオプションを選択した場合，選択ダイアログが表示されます。

Survey Controller へエクスポートする結合測地グリッドファイルを作成します

このオプションを選択して，プロジェクトの座標系で現在使用されている測地グリッドファイルを使用して，新しい結合測地グリッドファイルを作成します。結合測地グリッドファイル作成ダイアログが表示されます。


名前を付けて保存ダイアログ (測地グリッド -ジオイドグリッド エクスポ-ト )
名前を付けて保存ダイアログ(測地グリッド/ジオイドグリッドエクスポート)

このダイアログを使用して，結合測地グリッド(*.cdg)ファイル，またはジオイドグリッド(*.ggf)ファイルの名前を入力します。

OKをクリックしてデータ転送(Data Transfer )の名前を付けて保存ダイアログを開きます。


結合測地グリッドファイル作成ダイアログ

このダイアログを使用して，作成したい結合測地グリッド(*.cdg )ファイルの地域を定義します。そして，フィールドで使用するため，結合測地グリッドファイルをTrimble Survey Controller へ送信します。

.cdg ファイルを作成するには，プロジェクトの座標系がその座標系に測地グリッドを使用している必要があります。測地グリッドファイルの使用法に関する詳細な情報は，Trimble 座標系マネージャ�ユーティリティのオンラインヘルプをご覧ください。

これを呼び出すには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へ測地グリッドオプションを選択します。

4.	OKをクリックします。測地グリッドエクスポートダイアログが表示されます。

5.	Survey Controller へエクスポートする結合測地グリッドファイルを作成しますオプションを選択します。

6.	OKをクリックします。

地球の上の黄色いボックスは，緯度・経度測地グリッドファイルがカバーする地域を定義します。

ツールを使用してボックスをドラッグし，結合測地グリッドでカバーしたい測地グリッド範囲内の地球上の地域を囲みます。

ファイルプロパティ

ファイルプロパティグループは，.cdg ファイルを作成するために使用されるファイルのプロパティを表示します。

測地グリッド

.cdg ファイルを作成するために使用される測地グリッドを表示します。

緯度グリッドファイル

.cdg ファイルを作成するために使用される緯度グリッドファイルを表示します。

経度グリッドファイル

.cdg ファイルを作成するために使用される経度グリッドファイルを表示します。

グリッドプロパティ

グリッドプロパティグループは，定義しているグリッドのプロパティを表示します。

緯度限界

現在のボックスの緯度の範囲を表示します。

経度限界

現在のボックスの経度の範囲を表示します。

ファイルサイズ

作成される.cdg ファイルのサイズを表示します。ファイルサイズの値は地球上のボックスの形を変更するごとに変わります。

Survey Controller の名前

Trimble Survey Controller 内で使用される，.cdg ファイルの内部的な名前を表示します。Survey Controller の名前フィールドの標準値は，元の測地グリッドの名前です。.cdg ファイルがTrimble Survey Controller のジョブで使用されている場合，内部名が参照されます。データコレクタ(*.dc)ファイルのインポート中，Trimble Geomatics Office は内部名を使用して，.dc ファイルで使用されている結合測地グリッドがTrimble Geomatics Office プロジェクトの測地グリッドと一致するか，判断します。

ノート：このフィールドを編集する場合，名前のはじめか最後に追加するだけにしてください。これにより，名前はユニークになり，しかもインポート時に元の測地グリッドが認識できます。Survey Controller の名前フィールドに測地グリッドの名前を含まない限り，先に進めません。

地球プロパティ

地球プロパティグループはカーソルの位置を表示し，地球の表示を設定するオプションがあります。

カーソル位置

地球内のマウスポインタの現在の緯度・経度位置を表示します。

州境界線表示

このチェックボックスを選択して，地球に州の境界線を表示します。

国境界線表示

このチェックボックスを選択して，地球に国の境界線を表示します。

河川表示

このチェックボックスを選択して，地球に河川を表示します。


Survey Controller へジオイドモデル(*.ggf)オプション

詳細情報

利用方法	ダイアログ	関連項目
概要

ジオイドグリッド(*.ggf)ファイルは、定義された地域のWGS-84 楕円体とジオイド間の差を保存しています。ジオイドモデルに関する詳細は、ジオイドモデル�概要の項目を参照してください｡

.ggf ファイルがTrimble Geomatics Office プロジェクトの座標系の一部として使用されている場合，GPS ポイントのおおよその標高が計算されます。フィールドで.ggf ファイルを使用するには、Trimble Geomatics Office を使用して.ggf ファイルをTrimble Survey Controller (バージョン6.00以降)へ転送します。

これを行うには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へジオイドファイルオプションを選択します。

ジオイドモデルエクスポートダイアログが表示されます。

このオプションで，下の操作が選択できます。

プログラムファイル\共有ファイル\Trimble\GeoData フォルダにある.ggf ファイルすべてを転送。

より小さいジオイドグリッドファイルを抜き出すために、現在のTrimble Geomatics Office プロジェクトで使用されている.ggf ファイルをサブグリットします。この処理は，Trimble Survey Controller (バージョン6.00以降)が動作しているTSC1 装置に送信する.ggf ファイルのサイズを小さくします。

Trimble Survey Controller の各バージョンでサポートされているジオイドモデルに関する情報は，ジオイドモデルとSurvey Controllersの項目をご覧ください。

サブグリッドを作成して新しい.ggf ファイルを作成するとき，元のジオイドモデルの名前が保存されます(例えば，GEOID96 Conus )。この内部名はまた，サブグリッドの.ggf ファイルを使用する.dc ファイルに含まれます。.dc ファイルのインポート時，Trimble Geomatics Office はこの名前を使用して，フィールドで使用されたジオイドモデルがTrimble Geomatics Office プロジェクトに定義されているジオイドモデルと一致するか判断します。

ノート：Trimble グリッドファクトリユーティリティを使用して，ジオイドモデルファイルをサブグリッドにすることもできます。グリッドファクトリユーティリティはTrimble Geomatics Office のインストールのカスタムオプションの一部です。


TDS Survey Pro CE へジオイドモデル(*.ggf)オプション

詳細情報

利用方法	ダイアログ	関連項目
概要

ジオイドグリッド(*.ggf)ファイルは、定義された地域のWGS-84 楕円体とジオイド間の差を保存しています。ジオイドモデルに関する詳細は、ジオイドモデル�概要の項目を参照してください｡

.ggf ファイルがTrimble Geomatics Office プロジェクトの座標系の一部として使用されている場合，GPS ポイントのおおよその標高が計算されます。フィールドで.ggf ファイルを使用するには、Trimble Geomatics Office を使用して.ggf ファイルをTrimble Survey Pro CE (バージョン3.5以降)へ転送します。

これを行うには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	ジオイドファイルをTDS Survey Pro CEへオプションを選択します。

ジオイドモデルエクスポートダイアログが表示されます。

このオプションで，下の操作が選択できます。

プログラムファイル\共有ファイル\Trimble\GeoData フォルダにある.ggf ファイルすべてを転送

より小さいジオイドグリッドファイルを抜き出すために、現在のTrimble Geomatics Office プロジェクトで使用されている.ggf ファイルをサブグリットします。この処理は、Trimble Survey Pro CE (バージョン3.5以降)が動作しているTSCE 装置に送信する.ggf ファイルのサイズを小さくします。

ノート：Trimble グリッドファクトリユーティリティを使用して，ジオイドモデルファイルをサブグリッドにすることもできます。グリッドファクトリユーティリティはTrimble Geomatics Office のインストールのカスタムオプションの一部です。


ジオイドモデルとTrimble Survey Controller

ジオイドモデルをTrimble Survey Controller  バージョン6.00(または，それ以降)に転送することができます。Trimble Survey Controller は，ポイントの表示をWGS-84 位置とグリッド(NEE )位置で切り替えるとき，ジオイドモデルを使用します。

一般に，ジオイドモデルはとても大きいファイルです。普通，完全なジオイドモデルをTrimble Survey Controller  バージョン6.00(または，それ以降)にアップロードするのは無理です。

ファイル/エクスポート/Survey Controller へジオイドファイルオプションを使用して，使用する地域のより小さいジオイドモデルを作成します。そして，この小さくなったファイルをTrimble Survey Controller へ転送します。

以前のTrimble Survey Controller  バージョン

下はTrimble Survey Controller の以前のバージョンに関係します。

バージョン5.00

これは軍用バージョンで，一般にはリリースされていません。

バージョン4.00

このバージョンには，ジオイドモデルを使用できません。Trimble Geomatics Office が完全な座標系定義をポイントの位置に従ってそれぞれグリッド座標，WGS-84 座標をTrimble Survey Controller  バージョン4 の.dc ファイルに書いた場合，誤った高度/標高がTrimble Survey Controller に表示されます。

これは，データ表示が切り替えられた時にTrimble Survey Controller で起こります。グリッド座標が転送された時は間違ったWGS-84 高度が表示され，WGS-84 座標が転送された時は間違ったグリッドポイントの標高が表示されます。

これを避けるため，Trimble Geomatics Office はプロジェクト定義の測地系レコードを出力し，ジオイドモデルのため，NEE とWGS-84 の値を変換することは無理であることを警告します。そして，空白の変換が追加されたことを警告します。このあとに，方法がなしに設定されたもうひとつの測地系レコードが続きます。後ろの測地系レコードは，常に前の測地系レコードを上書きします。これは，Trimble Survey Controller  バージョン4.00 において，WGS-84 とグリッド座標間のポイント表示の切替えができないことを意味します。これは，誤った値を表示することを防ぎます。

フィールド作業において，グリッド座標をアップロードする場合，必ずキャリブレーションを行ってください。これらのポイントを使用する新しいフィールド作業に着手する前に，必ず行ってください。(キャリブレーションを行うためにグリッドポイントを転送するのはかまいません。)

ノート：WGS-84 座標が転送された場合，すぐに設定できます。しかし，フィールドでキャリブレーションを行うまで，グリッド座標を表示することはできません。

バージョン4.00 より前のバージョン

以前のTrimble Survey Controller バージョンは，WGS-84 座標のアップロードのみ扱うことができます。これは，プロジェクトのジオイドモデルの使用により影響されないためです。


ジオイドモデルエクスポートダイアログ

Survey Controller へジオイドモデル(*.ggf)オプションか、TDS Survey Pro CE へジオイドモデル(*.ggf)オプションを選択すると，ジオイドモデルエクスポートダイアログが表示されます。

既存のジオイドモデルをSurvey Controller にエクスポートします

このオプションを選択して，ジオイドグリッドファイルをTrimble Survey Controller (バージョン6.00 以降)か、TDS Survey Pro CE（バージョン4以降）へエクスポートします。GeoData フォルダーにある既存のジオイドグリッドファイルのどれでもエクスポートできます。このオプションを選択する場合，選択ダイアログが表示されます。

Survey Controller へエクスポートするジオイドモデルのサブグリッドを作成します

このオプションを選択して，プロジェクト座標系で現在使用しているジオイドグリッドのサブグリッドを作成します。ジオイドグリッドファイル作成ダイアログが表示されます。


ジオイドグリッドファイル作成ダイアログ

このダイアログを使用して，プロジェクトの座標系で使用されているジオイドグリッドファイルをベースにする新しいジオイドグリッドファイル作成したい地域を定義します。

このダイアログを呼び出すには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へジオイドファイル(*.ggf)オプションか、TDS Survey Pro CEへジオイドファイル(*.ggf)オプションを選択します。

4.	OKをクリックします。ジオイドモデルエクスポートダイアログが表示されます。

5.	エクスポートのためにジオイドモデルのサブグリッド作成オプションを選択します。

6.	OKをクリックします。

地球の上の黄色いボックスは，ジオイドモデルがカバーする地域を定義します。

ツールを使用してボックスをドラッグし，ジオイドグリッドでカバーしたいジオイドグリッド範囲内の地球上の地域を囲みます。現在のボックスのファイルサイズが表示されます。

ファイルプロパティ

ファイルプロパティグループは，.ggf ファイルを作成するために使用されるジオイドグリッドファイルのプロパティを表示します。

ジオイド

プロジェクトの座標系で使用されているジオイドモデルを表示します。

ジオイドグリッドファイル

プロジェクトの座標系で使用されているジオイドモデルのジオイドグリッドファイル名を表示します。

グリッドプロパティ

グリッドプロパティグループは，定義しているグリッドのプロパティを表示します。

緯度限界

現在のボックスの緯度の範囲を表示します。

経度限界

現在のボックスの経度の範囲を表示します。

ファイルサイズ

作成されるジオイドグリッドファイルのサイズを表示します。ファイルサイズの値は地球上のボックスの形を変更するごとに変わります。

名前

Trimble Survey Controller かTDS Survey Pro CE ソフトウェア内で使用される，サブグリッドファイルの内部的な名前を表示します。Survey Controller の名前フィールドの標準値は，元のジオイドモデルの名前です。.ggf ファイルがTrimble Survey Controller のジョブで使用されている場合，内部名が参照されます。データコレクタ(*.dc)ファイルのインポート中，Trimble Geomatics Office は内部名を使用して，.dc ファイルで使用されているジオイドモデルがTrimble Geomatics Office プロジェクトのジオイドモデルと一致するか，判断します。

ノート：このフィールドを編集する場合，名前のはじめか最後に追加するだけにしてください。これにより，名前はユニークになり，しかもインポート時に元のジオイドモデルが認識できます。Survey Controller の名前フィールドにジオイドモデルの名前を含まない限り，先に進めません。

地球プロパティ

地球プロパティグループはカーソルの位置を表示し，地球の表示を設定するオプションがあります。

カーソル位置

地球内のマウスポインタの現在の緯度・経度位置を表示します。

州境界線表示

このチェックボックスを選択して，地球に州の境界線を表示します。

国境界線表示

このチェックボックスを選択して，地球に国の境界線を表示します。

河川表示

このチェックボックスを選択して，地球に河川を表示します。

ノート：Trimble グリッドファクトリユーティリティを使用して，ジオイドモデルファイルをサブグリッドにすることもできます。グリッドファクトリユーティリティはTrimble Geomatics Office のインストールのカスタムオプションの一部です。


Survey Controller へ特徴・属性ライブラリ(*.fcl)オプション

概要と詳細

特徴・属性ライブラリをTrimble Survey Controller へ転送するには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へ特徴・属性ライブラリ(*.fcl)オプションを選択します。

特徴・属性ライブラリ選択ダイアログが表示されます。

このオプションを使用して，Trimble Survey Controller へ特徴・属性ライブラリをエクスポートします。これにより，フィールドで特徴コードを収集することができます。特徴・属性ライブラリを使用して，属性が定義されている特徴の属性を収集することもできます。


特徴・属性ライブラリ選択ダイアログ

このダイアログを使用して、測量装置に転送したい特徴・属性ライブラリを選択します。

参照

参照をクリックして，ライブラリを選択します。

ファイル

ファイルフィールドの標準値は，最後にエクスポートされたファイルの名前です。

属性エクスポート

Trimble Survey Controller  バージョン7.00 以降にエクスポートする場合のみこれが可能です。このチェックボックスを選択して、特徴・属性ライブラリにある属性定義をエクスポートします。

属性情報をフィールドで収集したい場合，このオプションを使用します。このチェックボックスをオフにすると、ライブラリファイルで定義されている属性はまったくエクスポートされません。

TDS Survey Pro CE かTrimble 3600/5600 TDS ソフトウェアにエクスポートする場合にはこのフィールドは使用できません。

OK

適切な特徴・属性ライブラリを選択したら，OKをクリックします。

データ転送(Data Transfer )の名前を付けて保存ダイアログが表示されます。

ノート：コントロールコードもTrimble Survey Controller にエクスポートされます。


特徴・属性ライブラリオプションダイアログ

このダイアログを使用して，エクスポートしたいTrimble Survey Controller  バージョンを設定します。

このダイアログを呼び出すには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へ特徴・属性ライブラリオプションを選択します。

4.	オプションをクリックします。

バージョン

Trimble Survey Controller のバージョン7.00 より前のバージョンを選択している場合，特徴・属性ライブラリ選択ダイアログの属性エクスポートチェックボックスは使用できません。


Survey Controller へデ－タ辞書(*.ddf)オプション
Survey Controller へデータ辞書(*.ddf)オプション

概要と詳細

このオプションを使用してデータ辞書ファイルをTrimble Survey Controller  バージョン7.00 以降へエクスポートします。Trimble Survey Controller で，データ辞書を使用して属性を収集します。

データ辞書ファイルをTrimble Survey Controller へエクスポートするには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Survey Controller へデータ辞書(*.ddf)オプションを選択します。

4.	OKをクリックします。

選択ダイアログが表示されます。


選択ダイアログ(Trimble Survey Controller ソフトウェアへデータ辞書エクスポート )
選択ダイアログ(Trimble Survey Controller へデータ辞書エクスポート)

このダイアログを使用して，Trimble Survey Controller へ転送したいデータ辞書(*.ddf )ファイルを選択します。

開くをクリックすると，データ転送(Data Transfer )の名前をつけて保存ダイアログが表示されます。


Trimble Survey Controller ソフトウェアからデ－タ転送－概要
Trimble Survey Controller からのデータ転送　－　概要

利用方法

概要

Trimble Survey Controller が動作している装置に接続して、Trimble Geomatics Office へジョブを転送できます。インポート時，ジョブはSurvey Controller ファイル(*.dc)へ変換されます。これを行うには，Trimble Data Transfer ユーティリティに設定されているSurvey Controller が必ず，必要です。

ノート：ジョブに関連するTrimble GPS 生データ(*.dat )ファイルがある場合，.dat ファイルはジョブといっしょにインポートされます。ある.dat ファイルを2回以上，同じプロジェクトにインポートした場合，プロジェクトの既存の観測はDAT チェックインダイアログで標準で選択されません。

.dc ファイルのインポート時，Trimble Geomatics Office はTrimble Survey Controller で各ポイントに割り当てられたクラスと，ポイントの質を決定するために使用される方法を使用して，ポイントにその質を割り当てます。再計算は質を使用してポイントの計算された位置を決定します。

ノート：データをバージョン7.60 Survey Controller へ/からデータを転送するとき，バージョン7.5 dc ファイルフォーマットを使用します。

ノート：Trimble Survey Controller からダウンロードしたデータを使用して網平均を実行しようとする場合，測量実行時に気圧，気温，曲率，屈折率補正をSurvey Controller の測量スタイルに入力していたことを確認してください。


ノートレコード－概要

プロジェクトのノートは，Trimble Survey Controller からのユーザ入力されたノートです。測量情報でないノート，'初期化しました'とか'初期化が無効になりました'，はプロジェクトに置かれます。

ノートレコードはTrimble Survey Controller の古いバージョンで次の目的に使用されます。

Trimble Survey Controller の古いバージョンを使用していてノートレコードを使用したい場合，選択/タイプダイアログを選択してプロジェクトのすべてのノートレコードを選択します。


Sokkia デ－タレコ－ダファイル(*.sdr)
Sokkia データレコーダファイル(*.sdr)

Trimble Geomatics Office はSokkia データレコーダファイル(*.sdr)フォーマットをサポートします。

Trimble Geomatics Office を使用して下のことが可能です。

Sokkia データレコーダファイル(*.sdr)をTrimble Geomatics Office プロジェクトへインポートする。

Trimble Geomatics Office プロジェクトをSokkia データレコーダファイル(*.sdr)へエクスポートする。

Sokkia データレコーダファイル(*.sdr)をインポートするには､

1.	ファイル/インポートを選択します。インポートダイアログが表示されます。

2.	測量タブを選択します。

3.	Sokkia データレコーダファイル(*.sdr)オプションを選択します。開くダイアログが表示されます。

4.	フォルダからインポートしたいファイルを選択して開くをクリックします。

Trimble Geomatics Office の現在のプロジェクトをSokkia データレコーダファイル(*.sdr)にエクスポートするには､

1.	ファイル/エクスポートを選択します。エクスポートダイアログが表示されます。

2.	測量タブを選択します。

3.	SDRファイル(*.sdr)オプションを選択します。

4.	オプションをクリックしてデータコレクタオプションダイアログを開き，ファイルの内部名とSokkia データレコーダファイルのバージョンを指定します。

5.	OKをクリックして設定を確定し，エクスポートダイアログへ戻ります。

6.	OKをクリックします。名前を付けて保存ダイアログ!JumpID(`DataXfer.hlp',`IDH_RDM_send_Save_As_dialog')が表示されます。

7.	ファイルをエクスポートしたいフォルダを選択し、ファイル名を入力してから、保存をクリックします｡


Trimble Survey Controller ソフトウェアへUK National Grid ファイルを転送
Trimble Survey Controller へUK National Grid ファイルを転送

利用方法

Trimble Data Transfer ユーティリティを使用して，UK National Grid 投影のグリッドファイル(*.pgf)を直接，Trimble Survey Controller バージョン7.5 以降へ転送します。

Program Files\Common Files\Trimble\Geodata フォルダにある既存の.pgf ファイルならどれでも転送できます。

ノート：このエクスポートオプションは，Trimble Data Transfer ユーティリティが単独モードで実行しているときのみ，使用できます。このオプションは，Trimble Geomatics Office のエクスポートダイアログからは使用できません。


フィ-ルド記入-概要
フィールド記入－概要

詳細情報

利用方法

概要

フィールドに値を入力するには，フィールド記入を使用します。例えば，希望するレイヤーのポイントをクリックすることで、レイヤーフィールドを埋める(記入する)ことができるようになります。

フィールド記入が使用できるフィールドでは，グラフィックウィンドウのポインターは下のように表示されます。

ノート：グラフィックウィンドウで選択したエンティティが，ハイライトされたフィールドで必要とされる値を提供できない場合は，ダイアログ内のフィールドに変更は加えられません。

フィールドの中には，値がグループとして記載されるものもあり，この場合1回のクリックで，関連する全てのフィールドに値が入力されます。たとえば，北距，東距，標高のフィールドは通常1つのグループになっています。このうち，1つのフィールドだけに記入したい場合は，希望のフィールドを選択し，Altキーを押しながらクリックしてください。

フィールド記入が行われると、Trimble Geomatics Office は次の空フィールドへ自動的に移動します。

フィールド記入の特殊な使用法

フィールド記入には，次のような特殊な使用法があります。

方位角フィールドを埋める際に，Shiftキーを押しながらクリックをすると，対角の方位角を入力することができます。しかし，方位角と距離でポイントを追加している時には，この方位角のフィールド記入は使用できません。

Ctrlキーを押しながらフィールド記入を使用すると，エンティティへ飛んでしまうことなく座標だけを選択できます。これにより，エンティティに近い場所にある座標も選択が楽にできるようになります。

表示メニューのコマンド(ズーム，パン等)を使用することによって，フィールド記入に必要な値を持つエンティティの場所を特定することができます。場所を特定したあとは，値をコピーする前にフィールドにフォーカスを戻さなければなりません。


角度の入力

小数点以下の数字は、角度、単位、フォーマットの設定に従って処理されます。

フォーマットを設定するには，プロジェクトプロパティ・ダイアログ内の単位とフォーマットタブを使用してください。

例えば：

10.1234と入力する場合


単位の変換

単位を持つフィールド内の単位の表示を設定する場合(オンスクリーン表示，インポート，エクスポート，レポート等)は，プロジェクトプロパティ・ダイアログ内の単位とフォーマットタブを使用してください。

これで，フィールド内に入力された数字は，全てシステムに設定された値の単位として処理されます。例えば，標高に関する設定をメートル表示に設定した場合，標高フィールドに入力された全ての数字はメートルの値として処理されます。

この設定とは別の表示をしたい場合は，数値のあとにアルファベットの文字を直接書き込むことで行い，特定の単位を指定することによって，システムは他の値を使用することができるようになっています。

単位を特定することによって，他の単位数値を入力することもできます。例えば，標高を'25 sft' と入力した場合，Trimble Geomatics Office は自動的に単位(US測量フィート)を認識し，値を適切に処理します。

以下の表は，この機能に使用可能な値の概略です。


エンティティをドラッグする

マウスを使用して選択したエンティティを移動したり回転するには，編集ハンドルを使用します。

例えば，この機能を利用することによって，情報の内容を表示するのにより適した場所に注釈を移動して，メインのグラフィックウィンドウのレイアウトを向上させるなどができます。

テキスト／注釈

テキストもしくは注釈エンティティをドラッグするには，テキストまたは注釈，もしくはその両方を選択してから，マウスのポインタをテキストフレームの上に移動して，ハンドルを表示させることによって行います。表示されたハンドルの上にマウスのポインタを重ねると，マウス・ポインタはそれに応じたアイコンに形を変えます。ドラッグ・ポインタ(Drag pointer )は，エンティティを移動するのに使用します。回転ポインタ(Rotate pointer )は，エンティティを回転するのに使用します。

例えば：

必要なハンドルを選択して，ドラッグします。マウスのボタンを離した地点に，移動します。

ノート：固定タイプが右側のポジションにない限り，回転ハンドルは右上に配置されます。固定タイプが右側にある場合には，回転ハンドルは左上に配置されます。

編集ハンドルは，下のような位置にあります。

ノート：上記のベースライン(Baseline )は，ディセンダー(g，j，yなどの文字の下の部分)を除いた，文字の最下部のラインを表示します。(小文字のディセンダー部分は，ベースラインとボトムラインの間に表示されます)

曲線

曲線の入射角もしくは出射角を変更するには，曲線(複数も可)を選択し，マウス・ポインタをその曲線の上に移動して，回転ハンドルを表示してください。各曲線には，2つのハンドルがあります(入射角ハンドルと出射角ハンドル)。

編集ハンドルの上にポインタを重ねると，ポインタの形は [image] に変わります。

この回転ポインタは，選択した曲線(複数も可)を回転するのに使用します。

ノート：2つのつながった曲線を回転する場合には，編集ハンドルは1つで作業を行うことができます。Trimble Geomatics Office は，曲線と曲線がつながる部分に自動的に一般的な接線を割り当てます。

既存の複数エンティティを選択するには，Ctrlを押しながら行ってください。初期設定では，既存の複数エンティティの選択はオフになっています。

ポイント

ポイント(複数も可)の移動は，データベース・ポイントの単純な処理で構成されます。ポイントを移動するには，まずポイントを選択し，マウス・ポインタをそのポイントの上に移動させて，編集ハンドルを表示します。ハンドルの上にポインタを重ねると，ポインタの形は [image] に変わります。ポイントが希望の位置に移動できたら，マウスのボタンを離します。ポイントとテキストの移動ダイアログが表示されます。このダイアログを使用して，値の編集と確認を行います。

ポイントをドラッグすると，選択した全てのポイントとテキストが一緒に移動します。


名前のないポイント

プロジェクト内において，各エンティティはそれぞれ固有のハンドルといっしょに記録されています。ハンドルとは，Trimble Geomatics Office がポイントを認識するために使用する，固有の整数値です。これは，ポイントに何も名前が設定されていない場合でも，Trimble Geomatics Office は，そのポイントをその内部ハンドルによって認識できることを意味します。

名前のないポイントが，名前を必要とする場所に使用された場合(例：ポイント追加ダイアログで，終了ポイントに指定された場合等)には，そのポイントのデータベース用のハンドルが表示されます。等号(=)が名前の前に付き，これによってソフトウェアはどのポイントが選択されているかを認識します。


ステータスバー

ステータスバーは，グラフィックウィンドウの一番下にあり，座標情報を含めたソフトウェアの現在の状況に関する情報を表示します。

マウスをTimeline 表示エリアに移動すると，ステータスバーに時間情報が表示されます。時刻オプション設定によって表示される時間は，Windowsのローカル時刻，もしくはGPS週／秒になります。

Trimble Geomatics Office が，基線解析などの特定の作業を行っている時は，ステータスバーは進行状況の表示をします。

ステータスバー・インディケータの詳細に関しては，Trimble Geomatics Office のユーザーガイドを参照してください。


ステータスバー－ウィンドウの角

ウィンドウの角で，メインのグラフィック・ウィンドウのサイズを変更することができます。


進行状況インジケータ

Trimble Geomatics Office が特定の作業を行っている時は，ステータスバーは進行状況インジケータになります。

インジケータには，作業が何パーセント終了したかを示すバー・グラフと，作業の簡単な説明が表示されます。

作業が途中で中止できる場合は，ESC を押して取り消しますのメッセージが表示されます。このメッセージが表示された場合は，Escキーを押すことによって，作業を中止できます。中止できない場合は，このメッセージは表示されません。


元のサイズに戻すコマンド

このコマンドを使用して，アクティブなウィンドウのサイズを通常のサイズと場所に戻します。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office　ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから元のサイズに戻すを選択します。


移動コマンド

このコマンドは十字型の矢印を表示し，これによってアクティブウィンドウやダイアログボックスを移動することができるようにします。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから移動を選択します。

ノート：ウィンドウを最大にしている場合は，このコマンドは使用できません。


サイズコマンド

このコマンドは十字型の矢印を表示し，これによってアクティブウィンドウの大きさを変更することができるようにします。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューからサイズ変更を選択します。

マウス・ポインタが十字型の矢印に変化してから：

1.	キーボードの矢印キーの1つ( 左，右，上，下の矢印 ) を押して，ポインタを希望のウィンドウ境界線に移動します。

2.	矢印キーを押して，境界線を移動します。

3.	ウィンドウのサイズが希望のサイズになったら，Enter を押します。

ノート：ウィンドウを最大にしている場合は，このコマンドは使用できません。


最小化コマンド

このコマンドを使用すると，Trimble Geomatics Office のウィンドウが最小化され，アイコンになります。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから最小化を選択します。


最大化コマンド

このコマンドを使用すると，アクティブウィンドウが最大化されます。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

タイトルバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから最大化を選択します。


閉じるコマンド

このコマンドを使用して，アクティブウィンドウやダイアログボックスを閉じます。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから閉じるを選択します。


次へコマンド

このコマンドを使用して，開いている次のウィンドウに切り替えます。切り替えの順番は，ウィンドウが最初に開かれた順番です。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから次へを選択します。


前へコマンド

このコマンドを使用して，前に開かれていたウィンドウに切り替えます。切り替えの順番は，ウィンドウが最初に開かれた順番です。

このコマンドを呼び出すには、

1.	次の1つを行ないます。

タイトルバー上のTrimble Geomatics Office ボタン [image] をクリックします。

タイトルバーを右クリックします。

メニューバー上のシステムボタン [image] をクリックします。

システムメニューが開きます。

2.	システムメニューから前へを選択します。


切り替えコマンド

このコマンドを使用して，現在開いている全てのアプリケーションの一覧を表示します。

タスクリストを使用して，リストにある他のアプリケーションへの切り替え，もしくは終了を実行してください。

ダイアログ オプション

切り替えコマンドを選択すると，次のオプションを含むダイアログが表示されます。

オプション	説明
タスクリスト	切り替えたい，もしくは終了したいアプリケーションを選択します。
切り替え	選択したアプリケーションをアクティブにします。
タスクの終了	選択したアプリケーションを終了します。
取消	タスクリストのオプションを閉じます。
重ねて表示	開いているアプリケーションのタイトルバーが見えるように，アプリケーションを重ねて表示します。このオプションは，アイコン化されているアプリケーションには影響しません。
並べて表示	開いているアプリケーションを重ならないように並べて表示します。このオプションは，アイコン化されているアプリケーションには影響しません。
アイコンの整列	最小化されたアプリケーションの全てのアイコンを，スクリーンの最下部に並べて表示します。


Trimble Geomatics Office へのファイルのドラッグ－アンド－ドロップ
Trimble Geomatics Office へのファイルのドラッグ・ドロップ

概要と詳細	利用方法

WindowsエクスプローラとMicrosoft Windowsのドラッグ・ドロップ機能を使用して，コンピュータの端末からTrimble Geomatics Office のプロジェクトにファイルをインポートします。

インポートダイアログのタブに表示されている種類のファイルは，全てインポートが可能です。

ノート：.jobと.rawの形式のファイルに関しては，PCカードからTrimble Geomatics Office プロジェクトへドラッグ・ドロップすることはできません。これらのファイルをTrimble Geomatics Office プロジェクトに送るには，Trimble Geomatics Office を使用してください。Trimble Geomatics Office は，これらのファイルを適切なフォーマットに変換します。

単一フォーマット

ドラッグ・ドロップには，右と左，どちらのマウスボタンを使用してもかまいません。

しかし，次の理由から，右マウスボタンを使用する方が確実です。

ドラッグ後に右クリックをすると，インポート可能なフォーマットの一覧が表示され，この一覧の中から正しいフォーマットを選択することができます。

ドラッグ後に左クリックをすると，Trimble Geomatics Office は，インポートしようとしているファイルの拡張子から，ファイルのフォーマットを認識しようとします。しかし，ソフトウェアによって正しいフォーマットが選択されるとは限りません。

複数フォーマット

複数ファイルをドラッグ・ドロップするには，右と左，どちらのマウスボタンを使用してもかまいません。

右クリックをすると，同じタイプのファイルだけをまとめてドラッグ・ドロップすることができます。使用できるフォーマットの一覧は，インポートする適切なフォーマットを選択できるところに表示されます。異なるタイプのファイルをまとめてドラッグ・ドロップする場合(.dcと.datファイル等)，個別のインポートオプションは一覧に表示されません。それぞれのファイルタイプには，一覧から標準のタイプを選択してインポートオプションを使用してください。Trimble Geomatics Office は，インポートしようとしているファイルの拡張子から，ファイルのフォーマットを認識しようとします。しかし，ソフトウェアによって正しいフォーマットが選択されるとは限りません。

左クリックをすると，違うタイプのファイルをまとめてドラッグ・ドロップすることができます。Trimble Geomatics Office は，インポートしようとしているファイルの拡張子から，ファイルのフォーマットを認識しようとします。しかし，ソフトウェアによって正しいフォーマットが選択されるとは限りません。

ノート：Trimble Geomatics Office がドラッグ・ドロップによってインポートされたファイルのフォーマットを認識できない場合，サードパーティのデータ保存ファイル，もしくはNMEAファイルとしてインポートを行うオプションを選択できる，ショートカットメニューが表示されます。標準オプションを選択した場合，Trimble Geomatics Office はファイルをNMEAとしてインポートしようとします。

カスタムフォーマット

Trimble Geomatics Office プロジェクトに右クリックを使用してドラッグ・ドロップを行った場合，作成された全てのカスタム・インポートフォーマットがショートカットメニューに表示されます。

ヒント：プロジェクトが開かれていない場合，Options.ini もしくはプロジェクトをTrimble Geomatics Office にドラッグして，プロジェクトを開くことができます。


ショートカット メニュー

ショートカットメニューとは，内容に則して用意されるメニューで，ポインタをどこに持っていくかによって，それに応じたコマンドが提示されます。

ショートカットメニューは，次のような一般的なタスクに使用できます。

一般的に使用されるメニュー・コマンドとダイアログの呼び出し

画面設定の変更

フィールドコードの挿入

ショートカットメニューを呼び出すには、

1.	ポインタを適切な位置に持っていきます。

2.	マウスを右クリックします。


ホットキー

ホットキーとは，キーボードを使用してメニュー，もしくはダイアログから簡単にオプションを選択する方法です。キーはオプション説明において，下線付きのアルファベットで表示されています。

選択したいオプションに割り当てられた文字を，キーボードで押してください。


座標系　－　概要

詳細

ご利用方法	ﾀﾞｲｱﾛｸﾞ	関連項目
概要

Trimble Geomatics Office は､曲面（地球）上での計測を平面（地図や図面）に変換するのに座標系を使用します。例えば座標系は､GPSを使用して計測されたﾎﾟｲﾝﾄに対するｸﾞﾘｯﾄﾞ座標を計算するのに使用されます。（GPS計測はWGS-84楕円体で行われます）

座標系は以下の要素から構成されることができます。

測地系変換（WGS-84楕円体とﾛｰｶﾙ楕円体間）

投影

ｼﾞｵｲﾄﾞﾓﾃﾞﾙ

GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ（平面調整と高度調整から構成されます。）

すべてのﾌﾟﾛｼﾞｪｸﾄに対して座標系を選択しなければなりません。その代わりに､ｼｽﾃﾑを持たない（またはどのｼｽﾃﾑを選択すべきかわからない）場合には､標準投影を使用します。

ﾉｰﾄ：使用される投影のﾌﾟﾛﾊﾟﾃｨに従ってﾌﾟﾛｼﾞｪｸﾄ内のﾎﾟｲﾝﾄが投影原点から相応な距離にあることを確認してください。

座標系ﾃﾞｰﾀﾍﾞｰｽ

座標系ﾃﾞｰﾀﾍﾞｰｽは､現在.csdと呼ばれるﾌｧｲﾙとして保存されます。それは座標系情報のすべてを含みます。ﾄﾘﾝﾌﾞﾙ社は世界全域で発行されている座標系を広範囲にわたって提供します。座標系やｿﾞｰﾝ､ｻｲﾄ､測地系変換､楕円体､ｼﾞｵｲﾄﾞﾓﾃﾞﾙを定義したり編集したりするには､座標系ﾏﾈｰｼﾞｬ™ﾕｰﾃｨﾘﾃｨを使用します。

座標系の選択

ﾌﾟﾛｼﾞｪｸﾄに座標系を選択するには､以下の1つを使用します。

座標系ﾃﾞｰﾀﾍﾞｰｽからの座標系とｿﾞｰﾝ

座標系ﾃﾞｰﾀﾍﾞｰｽからのｻｲﾄ

未定義の標準投影

定義された標準投影

ｲﾝﾎﾟｰﾄ中にSurvey Controller (*.dc)ﾌｧｲﾙで特定された座標系

Trimble Geomatics Office で座標系を選択する時､ﾊﾟﾗﾒｰﾀは座標系ﾃﾞｰﾀﾍﾞｰｽから取り込まれます。

ﾌﾟﾛｼﾞｪｸﾄに対する座標系の変更

ﾌﾟﾛｼﾞｪｸﾄに対する座標系を変更するには､以下の1つを行います。

ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞを使用して新しい座標系を特定します。

異なる座標系を持つSurvey Controller (*.dc)ﾌｧｲﾙをTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄにｲﾝﾎﾟｰﾄします。ﾌﾟﾛｼﾞｪｸﾄが座標系を持ち､ﾌｧｲﾙが異なる座標系を持つ場合､ｿﾌﾄｳｪｱはｲﾝﾎﾟｰﾄ中に違いを探知し､どちらを使用するかを選択するように使用者に尋ねます。ﾌｧｲﾙのｼｽﾃﾑの使用を選択する場合､これがﾌﾟﾛｼﾞｪｸﾄに対する座標系を変更する方法です。

ﾌﾟﾛｼﾞｪｸﾄに対する座標系を変更する時､Trimble Geomatics Office はすべてのﾎﾟｲﾝﾄの座標を計算します。座標は､古い座標系から新しい座標系へと変換されます。これに対する一般過程は以下の通りです。

1.	すべての座標は楕円体に移されます。（楕円体は通常WGS-84楕円体ですが､投影だけが変更される時にはそれはﾛｰｶﾙ楕円体です。）

2.	新しい座標は､新しいﾊﾟﾗﾒｰﾀを使用して計算されます。

その過程は以下の図に示されています。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙか高度調整が古い座標系の一部である場合､ﾌｨｰﾙﾄﾞ観測から派生したのでないﾎﾟｲﾝﾄすべてのWGS-84高度を計算するためにそれが使用されます。同様に､ｼﾞｵｲﾄﾞﾓﾃﾞﾙか高度調整が新しい座標系に適用される場合､WGS-84高度からｸﾞﾘｯﾄﾞ座標の新しい標高を計算するためにそれが使用されます。

座標系の変更がRoadLinkとTrimble DTMLinkｿﾌﾄｳｪｱに与える影響

ﾌﾟﾛｼﾞｪｸﾄからTrimble RoadLink�ｿﾌﾄｳｪｱやTrimble DTMLink�ｿﾌﾄｳｪｱにﾎﾟｲﾝﾄをｴｸｽﾎﾟｰﾄする時､ｴｸｽﾎﾟｰﾄするﾎﾟｲﾝﾄはTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄへの後続の変更によっては更新されません。

ﾄﾘﾝﾌﾞﾙ社は､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄへの変更がすべて完了したと自信が持てるまでﾎﾟｲﾝﾄのｴｸｽﾎﾟｰﾄを行わないことをお勧めします。

Trimble Geomatics OfficeﾌﾟﾛｼﾞｪｸﾄからTrimble RoadlinkｿﾌﾄｳｪｱかTrimble DTMLinkｿﾌﾄｳｪｱに既にﾎﾟｲﾝﾄをｴｸｽﾎﾟｰﾄした後､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄの座標系を変更したり､ﾃﾞｰﾀを較正したりすると､以下の警告が現れます。

｢DTMLinkとRoadLinkのﾎﾟｲﾝﾄに対する座標は､座標系の変更時に更新されません｣

その場合には､以下の1つを行います。

OKをｸﾘｯｸして､ﾎﾟｲﾝﾄに対する座標がTrimble RoadLinkｿﾌﾄｳｪｱとTrimble DTMLinkｿﾌﾄｳｪｱでは変更されないことを承認します。

取消をｸﾘｯｸして､変更を取り消します。

Trimble RoadLinkｿﾌﾄｳｪｱとTrimble DTMLinkｿﾌﾄｳｪｱで最新の座標が使用されることを確実にするためには､以下を行います。

1.	Trimble RoadLinkと（または）DTMLinkｿﾌﾄｳｪｱで必要ないﾎﾟｲﾝﾄを削除します。

2.	Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄから再びﾎﾟｲﾝﾄをｴｸｽﾎﾟｰﾄします。


地面座標系

座標が投影ﾚﾍﾞﾙでなく地面ﾚﾍﾞﾙにあることを必要とする場合には､地面座標系を使用します。地面座標系を選択する時､ｸﾞﾘｯﾄﾞ距離は地面距離と同一です。

Trimble Geomatics Office で地面座標を使用するには､以下を行う必要があります。

1.	ﾌﾟﾛｼﾞｪｸﾄに対する座標系を定義します。

2.	ﾌﾟﾛｼﾞｪｸﾄの位置に座標を入力します。ﾌﾟﾛｼﾞｪｸﾄの位置は､ﾛｰｶﾙ緯度と経度として保存されます。

3.	地面縮尺係数を入力するか､ﾌﾟﾛｼﾞｪｸﾄの位置に対する座標を使用してそれを算出します。

ﾌﾟﾛｼﾞｪｸﾄに対する座標系の定義

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄでの座標系の選択方法と変更方法に関しては､座標系-概要

ﾌﾟﾛｼﾞｪｸﾄの位置に対して座標を入力

それを行うには､

1.	ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します。ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞが現れます。

2.	座標系ﾀﾌﾞを選択します。

3.	ﾛｰｶﾙｻｲﾄ設定ｸﾞﾙｰﾌﾟで､変更をｸﾘｯｸします。ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞが表示されます。

4.	ﾌﾟﾛｼﾞｪｸﾄの位置ｸﾞﾙｰﾌﾟで適切な座標を入力します。座標系が未定義の場合には､座標系を更新するように促されます。

緯度と経度は正確に近いことと､標高は標高の適切な概算であることが要求されるので､ﾌﾟﾛｼﾞｪｸﾄに対する平均標高を入力します。

地面縮尺係数

それを行うには､

1.	ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞで､｢地面座標の使用｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにし､以下の1つを行います。

地面縮尺係数を入力します。

ﾌﾟﾛｼﾞｪｸﾄの位置ﾁｪｯｸﾎﾞｯｸｽから｢縮尺係数の算出｣を選択します。ｿﾌﾄｳｪｱは､ﾌﾟﾛｼﾞｪｸﾄの位置ｸﾞﾙｰﾌﾟの値から地面縮尺係数を算出します。

地面座標の表示方法を決定します。北距と（または）東距ｵﾌｾｯﾄ､または4-5桁の座標を特定できます。このｵﾌﾟｼｮﾝを使用して､簡単に座標間の見分けができます。

ﾉｰﾄ：地面座標系は､あなたがﾌﾟﾛｼﾞｪｸﾄの場所の近くで作業をしていて､ﾌﾟﾛｼﾞｪｸﾄ高度に大きな変動はないことを仮定します。

地面縮尺係数は以下によって計算されます。

1.	基準標高(h)を決定します。

2.	標高係数を計算します。

ここでは､

R は楕円体の半径です。

h は基準標高です。

a は長半径です。

e2 は自乗された偏心です。

φは投影の原点緯度です。

3.	ﾌﾟﾛｼﾞｪｸﾄ位置の中心で地面縮尺係数を算出します。

ここでは､

s は､ﾌﾟﾛｼﾞｪｸﾄ位置のｸﾞﾘｯﾄﾞ縮尺係数です。

Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ10では､地面座標系が完全にｻﾎﾟｰﾄされています｡以下のﾉｰﾄは､Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.7 以前に対する地面座標系に関して述べています｡

ﾉｰﾄ:

Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.5-7.7 から地面座標を伴うﾌﾟﾛｼﾞｪｸﾄをｲﾝﾎﾟｰﾄ

地面縮尺係数が定義された､横ﾒﾙｶﾄﾙ図法のTrimble Survey Controller（ﾊﾞｰｼﾞｮﾝ7.5か7.7）ｼﾞｮﾌﾞをｲﾝﾎﾟｰﾄする場合（例えば､ｷｬﾘﾌﾞﾚｰｼｮﾝを伴う投影か測地なしのｼﾞｮﾌﾞ）､ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞの｢地面座標の使用｣ﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。そうしないと､地面縮尺係数が2度適用されます。

地面座標系を持たないTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに､定義された地面縮尺係数を持つTrimble Survey Controllerｼﾞｮﾌﾞをｲﾝﾎﾟｰﾄする時､ｼﾞｮﾌﾞの座標系とﾌﾟﾛｼﾞｪｸﾄの座標系が異なるという警告ﾒｯｾｰｼﾞが現れます。Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄ内にある座標系を使用してから､ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞの｢地面座標の使用｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.5-7.7 に地面座標を伴うﾌﾟﾛｼﾞｪｸﾄをｴｸｽﾎﾟｰﾄ

Trimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.7以前）に定義された地面座標系を持つTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄをｴｸｽﾎﾟｰﾄしてから､Trimble Geomatics Office に再びｲﾝﾎﾟｰﾄする（戻す）場合､座標系には差異が生じます。Trimble Geomatics Office座標系を受け入れるのを確認してください。

Trimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.7以前）は､ﾗﾝﾍﾞﾙﾄ正角二基本緯線円錐図法を持つ地面座標系をｻﾎﾟｰﾄしません。座標系は､縮尺係数を持つﾗﾝﾍﾞﾙﾄ正角一基本緯線円錐図法でTrimble Geomatics Office からTrimble Survey Controller へｴｸｽﾎﾟｰﾄされます。

ﾉｰﾄ：The Trimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.7以前）は､ｱﾙﾍﾞﾙｽ正積円錐図法を持つ地面座標系をｻﾎﾟｰﾄしません。Trimble Survey Controller に定義された､ｱﾙﾍﾞﾙｽ正積円錐図法を持つ地面座標系をｴｸｽﾎﾟｰﾄしたい場合には､地面座標を除去するか､投影法を変更します。


測地変換　－　概要

詳細

関連項目

概要

測地変換とは､座標を1つの楕円体（例､WGS-84 楕円体）からﾛｰｶﾙ楕円体の座標へと転換するのに使用されるﾊﾟﾗﾒｰﾀのｾｯﾄです。（ﾛｰｶﾙ楕円体は投影によって使用される楕円体です。）測地変換は座標系定義の一部です。

以下の測地変換方法を利用できます。

ﾓﾛﾃﾞﾝｽｷ（3 ﾊﾟﾗﾒｰﾀ）

7 ﾊﾟﾗﾒｰﾀ

測地ｸﾞﾘｯﾄﾞ

多重回帰

すべての方法は座標系ﾃﾞｰﾀﾍﾞｰｽ内に保管されています。

新しい測地変換を定義するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用して座標系ﾃﾞｰﾀﾍﾞｰｽを編集します。


測地変換　－　ﾓﾛﾃﾞﾝｽｷ（3 ﾊﾟﾗﾒｰﾀ）

概要と詳細

ﾓﾛﾃﾞﾝｽｷ測地変換は､WGS-84楕円体の原点とﾛｰｶﾙ楕円体の原点間（逆の順序もあり）のX､Y､Z方向の偏差を定義します。

ﾓﾛﾃﾞﾝｽｷ測地変換は､3 ﾊﾟﾗﾒｰﾀ測地変換と呼ばれることもあります。

表示詳細

ﾌﾟﾛｼﾞｪｸﾄの座標系の一部として定義されたﾓﾛﾃﾞﾝｽｷ測地変換を持つ場合には､測地変換値を見ることができます。

これを行うには､座標系詳細ﾀﾞｲｱﾛｸﾞを使用します。

こういったﾌｨｰﾙﾄﾞは､WGS-84楕円体の原点からﾛｰｶﾙ楕円体の原点への3D直行座標（X､Y､Z）変換を定義します。

測地変換は座標系ﾃﾞｰﾀﾍﾞｰｽ（現在.csd）に保管されます。それを編集するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。


測地変換　－　7 ﾊﾟﾗﾒｰﾀ

概要と詳細

7 ﾊﾟﾗﾒｰﾀ測地変換は､WGS-84楕円体からﾛｰｶﾙ楕円体へか､またはﾛｰｶﾙ楕円体からWGS-84楕円体への変換を定義します。

偏差

こういったﾌｨｰﾙﾄﾞは､WGS-84楕円体の原点からﾛｰｶﾙ楕円体の原点への3D直行座標（X､Y､Z）変換を定義します。

回転

回転X 値は､X､Y､Z軸についてその順序で回転の角度を定義します。WGS-84楕円体の直行座標軸はﾛｰｶﾙ楕円体の軸にそれが一列に並ぶには､その角度で回転されなければならなりません。

回転角度は､軸のﾌﾟﾗｽ端から見て､各軸の逆時計回りに対してﾌﾟﾗｽです。

縮尺係数

すべての座標はこの値で掛け算されます。それはppmで定義されます。縮尺係数が6.02の場合､すべての座標には1.00000602が掛けられます。

表示詳細

ﾌﾟﾛｼﾞｪｸﾄの座標系の一部として定義された7 ﾊﾟﾗﾒｰﾀ測地変換を持つ場合には､測地変換値を見ることができます。

これを行うには､座標系詳細ﾀﾞｲｱﾛｸﾞ－測地変換ﾀﾌﾞを使用します。

測地変換は座標系ﾃﾞｰﾀﾍﾞｰｽ（現在.csd）に保管されます。それを編集するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。


測地変換　－　測地ｸﾞﾘｯﾄﾞ

概要と詳細

測地ｸﾞﾘｯﾄﾞ測地変換は､そのｴﾘｱに対する測地変換ﾊﾟﾗﾒｰﾀの値を含んで発行されたﾌｧｲﾙです。ﾌｧｲﾙは､その場所で測地変換値を補間するために使用されます。

ﾌﾟﾛｼﾞｪｸﾄ座標系定義の一部として測地ｸﾞﾘｯﾄﾞを使用するには､緯度･経度測地ｸﾞﾘｯﾄﾞ(*.dgf)ﾌｧｲﾙによって定義される測地変換を選択しなければなりません。

測地ｸﾞﾘｯﾄﾞﾌｧｲﾙを使用して測地変換を見たり作成したりするには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。

ﾌｨｰﾙﾄﾞで測地ｸﾞﾘｯﾄﾞﾌｧｲﾙを使用するには､測地ｸﾞﾘｯﾄﾞﾌｧｲﾙを結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙとしてTrimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.00かそれ以上）に移送する必要があります。


測地変換　－　多重回帰

概要と詳細

多重回帰測地変換は､ﾛｰｶﾙｴﾘｱにある予測された移動への多項方程式を適合することによってWGS-84楕円体とﾛｰｶﾙ楕円体間の変換を定義します。多重回帰測地変換を追加するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。

表示詳細

ﾌﾟﾛｼﾞｪｸﾄの座標系の一部として定義された多重回帰測地変換を持つ場合には､測地変換値を見ることができます。

これを行うには､座標系詳細ﾀﾞｲｱﾛｸﾞ－測地変換ﾀﾌﾞを使用します。

測地変換は座標系ﾃﾞｰﾀﾍﾞｰｽ（現在.csd）に保管されます。それを編集するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。


投影法　－　概要

詳細

関連項目

概要

投影とは､直角座標ｸﾞﾘｯﾄﾞ上の楕円体の曲面に対する数学式です。

投影を使用して､ﾛｰｶﾙ測地座標をﾛｰｶﾙｸﾞﾘｯﾄﾞ座標に変換します。

ｸﾞﾘｯﾄﾞ座標は､地球の表面か､この表面の一部を象徴する地図を作成するために記入されます。

結果として発生するｸﾞﾘｯﾄﾞ座標でひずみを最小に抑えるために､それぞれの国や地方は異なる投影法を使用します。座標系ﾏﾈｰｼﾞｬ™ﾕｰﾃｨﾘﾃｨは､多数の投影法を含んでいます。（例､横ﾒﾙｶﾄﾙやﾗﾝﾍﾞﾙﾄ一基本）特定な投影法の詳細に関しては､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨのﾍﾙﾌﾟを参照してください。

ﾉｰﾄ：ﾌﾟﾛｼﾞｪｸﾄのﾎﾟｲﾝﾄは使用された投影のﾌﾟﾛﾊﾟﾃｨに従って投影原点から適切な距離にあることを確認してください。

座標系定義の一部として投影ﾊﾟﾗﾒｰﾀを定義するには､座標系ﾏﾈｰｼﾞｬ™ﾕｰﾃｨﾘﾃｨを使用します。


ｼﾞｵｲﾄﾞﾓﾃﾞﾙ　－　概要

詳細

関連項目

概要

ｼﾞｵｲﾄﾞとは､海面に近い､不変の重力ﾎﾟﾃﾝｼｬﾙの表面です。

GPSと共に観測したﾎﾟｲﾝﾄは､WGS-84楕円体を基礎とする高度を持ちます。こういった高度は楕円体高として知られます。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙは､楕円体高を基礎とする標高を見積もらせてくれます。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙは､ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞ(*.ggf)ﾌｧｲﾙとして保存されます。.ggfﾌｧｲﾙは､ｸﾞﾘｯﾄﾞ上の多くのﾎﾟｼﾞｼｮﾝに対するｼﾞｵｲﾄﾞ分割を含みます。補間を使用して､こういったｼﾞｵｲﾄﾞ分割はｸﾞﾘｯﾄﾞ内に当てはまるあらゆるﾎﾟｲﾝﾄに対して計算されることができます。

GPSを使用して観測される各ﾎﾟｲﾝﾄに対してｼﾞｵｲﾄﾞﾓﾃﾞﾙが選択される時､Trimble Geomatics Office はその場所でｼﾞｵｲﾄﾞ分割(N)を補間するために.ggfﾌｧｲﾙを使用します。その後､それは観測された楕円体高(ｈ)に値を足したり引いたりします。これは､GPSﾎﾟｲﾝﾄに対するだいたいの海抜標高（e）を教えてくれます。ｼﾞｵｲﾄﾞとﾛｰｶﾙ楕円体の間の関係は以下の図を参照してください。

現存するｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙを使用して新しいｼﾞｵｲﾄﾞﾓﾃﾞﾙを定義するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。座標系ﾃﾞｰﾀﾍﾞｰｽ内のすべてのｼﾞｵｲﾄﾞﾓﾃﾞﾙは､ﾌﾟﾛｼﾞｪｸﾄに対して座標系を選択する時に有効です。

ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙをTrimble Survey ControllerやTDS Survey Pro CE ｿﾌﾄｳｪｱ(ﾊﾞｰｼﾞｮﾝ3.5以降)にｴｸｽﾎﾟｰﾄしたり､現存するｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙのｻﾌﾞｸﾞﾘｯﾄﾞを作成したりするのに､Trimble Geomatics Office を使用することができます。

ﾉｰﾄ：ｼﾞｵｲﾄﾞﾓﾃﾞﾙの使用やGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝの実行を行わない場合には､ﾎﾟｲﾝﾄの標高は楕円体高と同一であり､真の標高ではありません。ｼﾞｵｲﾄﾞﾓﾃﾞﾙがﾌﾟﾛｼﾞｪｸﾄ座標系で使用される場合には､それはGPSに対してだけでなくすべてのﾎﾟｲﾝﾄﾀｲﾌﾟに対してもﾛｰｶﾙ楕円体高と標高間での変換に使用されます。


座標系の変更　－　｢座標系の選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､現存する座標系やｻｲﾄを選択したり､ﾌﾟﾛｼﾞｪｸﾄに対する標準投影を定義したりします。

このﾀﾞｲｱﾛｸﾞは､選択設定のｶﾞｲﾄﾞをしてくれるｳｨｻﾞｰﾄﾞの第一ｽﾃｯﾌﾟです。

選択ﾀﾞｲｱﾛｸﾞ内では､次へをｸﾘｯｸして下へ､戻るをｸﾘｯｸして上へ移動します。

Trimble Geomatics Office は､座標系ﾃﾞｰﾀﾍﾞｰｽﾌｧｲﾙ(現在.csd)内の座標系を使用します。座標系ﾏﾈｰｼﾞｬ™ﾕｰﾃｨﾘﾃｨを使用して座標系のﾊﾟﾗﾒｰﾀを編集することができます。

新しい座標系

新しい座標系とｿﾞｰﾝや､座標系ﾃﾞｰﾀﾍﾞｰｽに保存されたﾛｰｶﾙｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄ､または標準投影を選択するには､

1.	｢新しい座標系｣を選択します。

2.	次へをｸﾘｯｸして座標系ﾀｲﾌﾟの選択ﾀﾞｲｱﾛｸﾞへと進みます。

3.	ｳｨｻﾞｰﾄﾞを使用して､ﾌﾟﾛｼﾞｪｸﾄに対する座標系を選択します。

最近使用された座標系

最近選択された10の座標系列記から座標系を選択するには､

1.	最近使用された座標系をｸﾘｯｸします。

2.	矢印ﾎﾞﾀﾝをｸﾘｯｸして､座標系の要約一覧をｽｸﾛｰﾙします。

3.	ﾌﾟﾛｼﾞｪｸﾄで使用したい座標系を選択します。

4.	終了をｸﾘｯｸします。

ﾉｰﾄ：座標系ﾃﾞｰﾀﾍﾞｰｽを使用するのが初めての場合には､｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞが現れます。（｢座標系の変更　－　座標系の選択｣ﾀﾞｲｱﾛｸﾞではありません。）それは､選択肢となる最近使用された座標系が存在しないからです。

ﾉｰﾄ：Trimble Geomatics Office は､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨで利用できる座標系のすべてをｻﾎﾟｰﾄしている訳ではありません。ｻﾎﾟｰﾄされていない座標系を選択すると､以下のﾒｯｾｰｼﾞが現れます。

｢未知の座標系ﾀｲﾌﾟです。｣


｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､使用したい座標系のﾀｲﾌﾟを選択します。

座標系とｿﾞｰﾝ

このｵﾌﾟｼｮﾝを選択して､座標系ﾃﾞｰﾀﾍﾞｰｽから座標系を選びます。

ｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄ

このｵﾌﾟｼｮﾝを選択して､以前座標系ﾃﾞｰﾀﾍﾞｰｽに保存されたｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄを選びます。ｻｲﾄは､GPSｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀを含む可能性がある､ﾛｰｶﾙｻｲﾄに対する座標系詳細を保管しています。

標準投影（横ﾒﾙｶﾄﾙ図法）

このｵﾌﾟｼｮﾝを選択して､標準投影を定義します。

戻る

戻るをｸﾘｯｸして､｢座標系の選択｣ﾀﾞｲｱﾛｸﾞに戻ります。

ﾉｰﾄ：座標系ﾃﾞｰﾀﾍﾞｰｽを使用するのが初めての場合には､選択肢となる最近使用された座標系が存在しないので､戻るは利用できません。

次へ

次へをｸﾘｯｸします。選択したｵﾌﾟｼｮﾝに従って､以下のﾀﾞｲｱﾛｸﾞの1つが現れます。

｢座標系ｿﾞｰﾝの選択｣ﾀﾞｲｱﾛｸﾞ

｢ｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄの選択｣ﾀﾞｲｱﾛｸﾞ

｢標準投影（横ﾒﾙｶﾄﾙ図法）｣ﾀﾞｲｱﾛｸﾞ


｢座標系ｿﾞｰﾝの選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､座標系ﾃﾞｰﾀﾍﾞｰｽで利用可能な座標系の一覧から､ﾌﾟﾛｼﾞｪｸﾄに対する座標系を選択します。

座標系ｸﾞﾙｰﾌﾟやｿﾞｰﾝのﾌﾟﾛﾊﾟﾃｨを見るには､

1.	座標系ｸﾞﾙｰﾌﾟやｿﾞｰﾝを反転表示します。

2.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌﾟﾛﾊﾟﾃｨを選択します。

座標系ｸﾞﾙｰﾌﾟ

この一覧は､座標系ﾃﾞｰﾀﾍﾞｰｽ内の座標系を含みます。1つの座標系は､異なるｴﾘｱに定義された1つかそれ以上のｿﾞｰﾝを含みます。

ｿﾞｰﾝ

この一覧は､選択された座標系に対して有効なｿﾞｰﾝを含みます。1つのｿﾞｰﾝは､測地変換（WGS-84楕円体からﾛｰｶﾙ楕円体へﾃﾞｰﾀを変換するための変換ﾊﾟﾗﾒｰﾀのｾｯﾄと楕円体を含む）とｼﾞｵｲﾄﾞﾓﾃﾞﾙ､投影ﾊﾟﾗﾒｰﾀを含みます。

戻る

戻るをｸﾘｯｸして､｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞに戻ります。

次へ

次へをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ｷｬﾘﾌﾞﾚ－ｼｮﾝｻｲﾄの選択｣ﾀﾞｲｱﾛｸﾞ
｢ｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄの選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､座標系ﾃﾞｰﾀﾍﾞｰｽで利用可能なｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄの一覧からｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄを選択します。ｻｲﾄは座標系ﾃﾞｰﾀﾍﾞｰｽ内に保管されています。座標系ﾏﾈｰｼﾞｬ™ﾕｰﾃｨﾘﾃｨ内でか､Trimble Geomatics Office （ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/座標系ﾀﾌﾞか測量/GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ）内でｻｲﾄを作成します。

ｻｲﾄのﾌﾟﾛﾊﾟﾃｨを見るには､

1.	ｻｲﾄ名を反転表示します。

2.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌﾟﾛﾊﾟﾃｨを選択します。

ｻｲﾄ詳細

このｸﾞﾙｰﾌﾟは､反転表示されたｻｲﾄに対する測地変換とｼﾞｵｲﾄﾞﾓﾃﾞﾙを示します。

戻る

戻るをｸﾘｯｸして､｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞに戻ります。

終了

終了をｸﾘｯｸして､座標系定義を完成し､｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞに戻ります。選択したｻｲﾄ定義は､ﾌﾟﾛｼﾞｪｸﾄに対する座標系です。

ﾉｰﾄ：Trimble Geomatics Office のｻｲﾄに対するｼﾞｵｲﾄﾞﾓﾃﾞﾙを変更することはできません。ｻｲﾄに対するｼﾞｵｲﾄﾞﾓﾃﾞﾙが使用されます。ｻｲﾄに対するｼﾞｵｲﾄﾞﾓﾃﾞﾙを変更するには､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用します。このﾕｰﾃｨﾘﾃｨでｻｲﾄを編集することができます。


｢標準投影（横ﾒﾙｶﾄﾙ図法）｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､標準投影ﾊﾟﾗﾒｰﾀを特定します。Trimble Geomatics Office は値を計算することができますし､使用者がそれを入力することもできます。

投影ﾊﾟﾗﾒｰﾀを自動的に計算

このﾁｪｯｸﾎﾞｯｸｽをｵﾝにして､ﾌﾟﾛｼﾞｪｸﾄに入力された最初のWGS-84ﾎﾟｼﾞｼｮﾝを原点として､かつ偽北距と偽東距の計算用の最初のｸﾞﾘｯﾄﾞ座標（北距と東距）を自動的に使用するようにTrimble Geomatics Office を設定します。

ﾉｰﾄ：南方位ｼｽﾃﾑ（必要な場合）とﾌﾟﾗｽの座標方向も特定しなければなりません。Trimble Geomatics Office はこういったﾌｨｰﾙﾄﾞを自動的に更新することはありません。

このﾁｪｯｸﾎﾞｯｸｽをｵﾌにして､投影ﾊﾟﾗﾒｰﾀを入力します。ﾀﾞｲｱﾛｸﾞ内の以下のﾌｨｰﾙﾄﾞが利用できるようになります。ﾌｨｰﾙﾄﾞに値を入力します。

中央緯度

投影の原点の緯度を入力します。

中央経度

投影の原点の経度を入力します。

偽北距と偽東距

標準投影に偽北距と偽東距を入力します。偽北距と偽東距は､標準投影の原点のｸﾞﾘｯﾄﾞ座標です。

縮尺係数

原点に対する縮尺係数を入力します。それは､投影に対する既知の縮尺係数を基礎とするべきです。これは､地球の表面の距離に対する投影上の距離の割合を意味します。地面座標のすべては､ｸﾞﾘｯﾄﾞ距離を与えるためにこの値によって増減されます。

南方位ｼｽﾃﾑ

このﾌｨｰﾙﾄﾞを選択して､南方位ｼｽﾃﾑを特定します。南方位ｼｽﾃﾑは､0度方位角として南を使用します。それはﾊﾜｲと南ｱﾌﾘｶで使用されます。（その他のｼｽﾃﾑは北を0度方位角として使用します。）

ﾌﾟﾗｽ座標方向

座標値が増加することを望む方向を特定するためにこのｵﾌﾟｼｮﾝを選択します。

戻る

戻るをｸﾘｯｸして､｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞに戻ります。

次へ

終了時に次へをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞが現れます。


｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ﾌﾟﾛｼﾞｪｸﾄに対するｼﾞｵｲﾄﾞﾓﾃﾞﾙを選択します。ｼﾞｵｲﾄﾞﾓﾃﾞﾙが座標系ﾃﾞｰﾀﾍﾞｰｽの座標系に対して定義される場合には､ｼﾞｵｲﾄﾞﾓﾃﾞﾙは自動的に選択されます。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙとは､ｼﾞｵｲﾄﾞや楕円体の分割で構成される数学的面です。それは､WGS-84楕円体と平均海面間の分割の推定です。ｼﾞｵｲﾄﾞﾓﾃﾞﾙは､GPSﾎﾟｲﾝﾄに対するおおよその海抜高度を引き出すために使用されます。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙなし

このｵﾌﾟｼｮﾝを選択して､座標系に対してｼﾞｵｲﾄﾞﾓﾃﾞﾙなしと特定します。ｼﾞｵｲﾄﾞﾓﾃﾞﾙを特定しない場合には､ﾎﾟｲﾝﾄの標高はﾛｰｶﾙ楕円体上の高度です。

このｵﾌﾟｼｮﾝを選択する場合､GPS観測に対してより正確な標高を得るためにGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行することをﾄﾘﾝﾌﾞﾙ社はお勧めします。

予め定義されたｼﾞｵｲﾄﾞﾓﾃﾞﾙ

ﾌﾟﾛｼﾞｪｸﾄに対してｼﾞｵｲﾄﾞﾓﾃﾞﾙを特定するには､それを一覧から選択します。ｼﾞｵｲﾄﾞﾓﾃﾞﾙの一覧は､座標系ﾃﾞｰﾀﾍﾞｰｽ（現在.csd）からです。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙの精度によっては､WGS-84高度とｼﾞｵｲﾄﾞ分割から引き出される標高は特質を与えられます。ｼﾞｵｲﾄﾞﾓﾃﾞﾙの特質を特定するには､ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞ/再算出ﾀﾌﾞの特質ﾌｨｰﾙﾄﾞでｼﾞｵｲﾄﾞﾓﾃﾞﾙを使用します。特質は､ﾎﾟｲﾝﾄに対する標高ﾌｨｰﾙﾄﾞの特質を決定するために使用されます。

戻る

戻るをｸﾘｯｸして､｢座標系ｿﾞｰﾝの選択｣ﾀﾞｲｱﾛｸﾞか｢標準投影(横ﾒﾙｶﾄﾙ図法)｣ﾀﾞｲｱﾛｸﾞに戻ります。

終了

終了をｸﾘｯｸして､座標系定義を完成し､｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞに戻ります。


ｻｲﾄ　－　概要

ｻｲﾄは一般的には､現存する座標系とｿﾞｰﾝを基礎とするﾛｰｶﾙGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ詳細を保管するのに使用されます。

GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行する時､それをまた簡単に使用することができるように､それと座標系ﾃﾞｰﾀﾍﾞｰｽへの座標系を保存することができます。

ｻｲﾄを保存するには､以下の1つを行います。

測量/GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを選択します。

ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/座標系ﾀﾌﾞを選択します。

代案として､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用して新しいｻｲﾄを作成することができます。このﾕｰﾃｨﾘﾃｨを使用する時､保存されたｻｲﾄはｻｲﾄﾀﾌﾞに現れます。

詳細に関しては､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨのﾍﾙﾌﾟを参照してください。

ﾉｰﾄ：調整変換ﾊﾟﾗﾒｰﾀをｻｲﾄとして保存することはできません。


未定義の標準投影の使用　－　概要/｢標準投影定義｣ﾀﾞｲｱﾛｸﾞ

概要

未定義の標準投影は､原点緯度と原点経度値を持たない標準投影法です。未定義の標準投影を使用するﾌﾟﾛｼﾞｪｸﾄに初めて測量ﾃﾞｰﾀを入力する時には､｢標準投影定義｣ﾀﾞｲｱﾛｸﾞが現れます。｢標準投影定義｣ﾀﾞｲｱﾛｸﾞは､入力するﾃﾞｰﾀに適切な投影ﾊﾟﾗﾒｰﾀの使用を提示します。ﾀﾞｲｱﾛｸﾞの異なるﾌｨｰﾙﾄﾞが､ﾌﾟﾛｼﾞｪｸﾄに追加されたﾃﾞｰﾀのﾀｲﾌﾟによって有効になります。以下の状況が考えられます。

ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄを含むﾌﾟﾛｼﾞｪｸﾄ（未定義の標準投影）にGPSﾎﾟｲﾝﾄの追加

定義された投影法を持つﾌｧｲﾙを未定義の標準投影を持つﾌﾟﾛｼﾞｪｸﾄにｲﾝﾎﾟｰﾄ

ﾌﾟﾛｼﾞｪｸﾄ（未定義の標準投影）にWGS-84ﾎﾟｲﾝﾄの追加

縮尺係数のみのﾌｧｲﾙ（未定義の標準投影）の使用

空のﾌﾟﾛｼﾞｪｸﾄにｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄの追加

未定義の標準投影を使用するには､定義された座標系を持たないﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄ（例､ﾄﾘﾝﾌﾞﾙ･ﾒｰﾄﾙや米国ﾌｨｰﾄﾃﾝﾌﾟﾚｰﾄ）を使用します。


ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄの追加（未定義の標準投影）

概要と詳細

未定義の標準投影（座標系なし）を持つTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに追加される最初のﾎﾟｼﾞｼｮﾝがｸﾞﾘｯﾄﾞﾎﾟｼﾞｼｮﾝである時に｢標準投影定義｣ﾀﾞｲｱﾛｸﾞが現れます。

｢標準投影定義｣ﾀﾞｲｱﾛｸﾞは以下のﾌｨｰﾙﾄﾞを含みます。

偽北距

投影の原点の北距です。北距値はﾌｧｲﾙ内の最初のﾎﾟｲﾝﾄから引き出されます。この値は変更できます。

偽東距

投影の原点の東距です。東距値はﾌｧｲﾙ内の最初のﾎﾟｲﾝﾄから引き出されます。この値は変更できます。

OK

OKをｸﾘｯｸして､標準投影ﾊﾟﾗﾒｰﾀを受け入れます。こういった値は､ﾌﾟﾛｼﾞｪｸﾄに対する座標系を定義するのに使用されます。こういったﾊﾟﾗﾒｰﾀを見るには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/座標系ﾀﾌﾞを選択してから詳細をｸﾘｯｸします。

ﾉｰﾄ：標準投影はそれでも完全に定義された訳ではないので､（原点緯度と原点経度は未定義です。）1つかそれ以上のGPSﾎﾟｲﾝﾄを含むﾌｧｲﾙをｲﾝﾎﾟｰﾄすることによって標準投影を更新することができます。


ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄを含むﾌﾟﾛｼﾞｪｸﾄ（未定義の標準投影）にGPSﾎﾟｲﾝﾄの追加

概要と詳細

未定義の標準投影（原点緯度と原点経度なし）を持つTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄが1つかそれ以上のｸﾞﾘｯﾄﾞﾎﾟｼﾞｼｮﾝを含む時に｢標準投影定義｣ﾀﾞｲｱﾛｸﾞが現れます。そして､

少なくとも1つのGPSﾎﾟｲﾝﾄを含むﾌｧｲﾙがｲﾝﾎﾟｰﾄされます。

または

WGS-84ﾎﾟｲﾝﾄがｷｰﾎﾞｰﾄﾞで入力されます。

｢標準投影定義｣ﾀﾞｲｱﾛｸﾞは､以下のﾌｨｰﾙﾄﾞを含みます。

北距

このﾌｨｰﾙﾄﾞはﾇﾙです。標準投影法を定義するのに使用されるGPSﾎﾟｲﾝﾄに対して最良とされる北距座標を入力します。

東距

このﾌｨｰﾙﾄﾞはﾇﾙです。標準投影法を定義するのに使用されるGPSﾎﾟｲﾝﾄに対して最良とされる東距座標を入力します。

緯度

ﾌｧｲﾙ内最初のGPSﾎﾟｲﾝﾄのWGS-84緯度がここに示されます。このﾌｨｰﾙﾄﾞは利用できません。

経度

ﾌｧｲﾙ内最初のGPSﾎﾟｲﾝﾄのWGS-84経度がここに示されます。このﾌｨｰﾙﾄﾞは利用できません。

OK

OKをｸﾘｯｸして､GPSﾎﾟｲﾝﾄに対するｸﾞﾘｯﾄﾞ座標を受け入れます。原点に対するWGS-84緯度とWGS-84経度値は､原点（定義済）に対する偽座標と､ﾀﾞｲｱﾛｸﾞで特定されたGPSﾎﾟｲﾝﾄに対する値を基に決定されます。すべてのﾊﾟﾗﾒｰﾀを見るには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/座標系ﾀﾌﾞを選択してから詳細をｸﾘｯｸします。

ﾉｰﾄ：ﾎﾟｲﾝﾄが一度ﾃﾞｰﾀﾍﾞｰｽに追加されると､標準投影は完全に定義されます。この時点から､ﾌｧｲﾙをｲﾝﾎﾟｰﾄしたり､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄにﾎﾟｲﾝﾄを追加したりする時には､標準投影ﾊﾟﾗﾒｰﾀは更新されません。しかし､GPSｷｬﾘﾌﾞﾚｰｼｮﾝを実行することで､投影原点を更新することができます。（測量/GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを選択します。）


ﾌﾟﾛｼﾞｪｸﾄ（未定義の標準投影）にWGS-84ﾎﾟｲﾝﾄの追加

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄが未定義の標準投影（原点緯度と原点経度なし）を持つ時に｢標準投影定義｣ﾀﾞｲｱﾛｸﾞが現れます。そして､

WGS-84ﾎﾟｲﾝﾄがｷｰﾎﾞｰﾄﾞで入力されます。

WGS-84ﾎﾟｲﾝﾄがｲﾝﾎﾟｰﾄされます。

｢標準投影定義｣ﾀﾞｲｱﾛｸﾞには以下のﾌｨｰﾙﾄﾞが含まれます。

北距

このﾌｨｰﾙﾄﾞは0です。標準投影法を定義するのに使用されるGPSﾎﾟｲﾝﾄに対して最良とされる北距座標を入力します。この値は､投影に対する偽北距として使用されます。

東距

このﾌｨｰﾙﾄﾞは0です。標準投影法を定義するのに使用されるGPSﾎﾟｲﾝﾄに対して最良とされる東距座標を入力します。この値は､投影に対する偽東距として使用されます。

原点緯度

ﾎﾟｲﾝﾄのWGS-84緯度がここに示されます。このﾌｨｰﾙﾄﾞは､投影に対する原点緯度です。このﾌｨｰﾙﾄﾞは利用できません。

原点経度

ﾎﾟｲﾝﾄのWGS-84経度がここに示されます。このﾌｨｰﾙﾄﾞは､投影に対する原点経度です。このﾌｨｰﾙﾄﾞは利用できません。

OK

OKをｸﾘｯｸして､標準投影ﾊﾟﾗﾒｰﾀを受け入れます。こういった値はﾌﾟﾛｼﾞｪｸﾄに対する座標系を定義するために使用されます。こういったﾊﾟﾗﾒｰﾀを見るには､ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/座標系ﾀﾌﾞを選択してから詳細をｸﾘｯｸします。

ﾉｰﾄ：標準投影が一度完全に定義されると､その時点から､ﾌｧｲﾙをｲﾝﾎﾟｰﾄしたり､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄにﾎﾟｲﾝﾄを追加したりする時には､標準投影ﾊﾟﾗﾒｰﾀは更新されません。しかし､GPSｷｬﾘﾌﾞﾚｰｼｮﾝを実行することで､投影原点を更新することができます。（測量/GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを選択します。）


未定義の標準投影を持つﾌﾟﾛｼﾞｪｸﾄにﾌｧｲﾙ（定義された投影法を持つ）のｲﾝﾎﾟ－ﾄ
未定義の標準投影を持つﾌﾟﾛｼﾞｪｸﾄにﾌｧｲﾙ（定義された投影法を持つ）のｲﾝﾎﾟｰﾄ

概要と詳細

ﾌﾟﾛｼﾞｪｸﾄ座標系は､ﾌｧｲﾙに特定された座標系に自動的に変換されます。

ﾒｯｾｰｼﾞがｲﾝﾎﾟｰﾄﾚﾎﾟｰﾄに書き込まれます。そのﾒｯｾｰｼﾞは以下の通りです。

｢ｲﾝﾎﾟｰﾄされた座標系とﾌﾟﾛｼﾞｪｸﾄ座標系が一致しませんでした。ｲﾝﾎﾟｰﾄされた定義は､未定義の標準投影(横ﾒﾙｶﾄﾙ図法)に優先して使用されました。｣


ﾌｧｲﾙからの座標系の使用

概要と詳細

ﾌｧｲﾙが定義された座標系を伴ってｲﾝﾎﾟｰﾄされる時､ﾌｧｲﾙに記録されている座標系定義はﾌﾟﾛｼﾞｪｸﾄに対する座標系定義と比較されます。それが異なる場合には､ﾌﾟﾛｼﾞｪｸﾄ座標系ﾀﾞｲｱﾛｸﾞが表示されます。

ﾌｧｲﾙ内で特定された座標系を使用するには､ﾌﾟﾛｼﾞｪｸﾄ座標系ﾀﾞｲｱﾛｸﾞの｢ﾃﾞｰﾀｺﾚｸﾀｰ定義の変換｣ｵﾌﾟｼｮﾝを選択します。

ﾌｧｲﾙ内の座標系が縮尺係数のみの座標系でない限り､ﾌﾟﾛｼﾞｪｸﾄ座標系定義はﾌｧｲﾙで特定されたものに変更されます。

Survey Controllerﾌｧｲﾙ内の座標系が縮尺係数のみの場合には､何が起こるかはﾌﾟﾛｼﾞｪｸﾄに対して定義された座標系によって決まります。

ﾉｰﾄ：ﾌﾟﾛｼﾞｪｸﾄ座標系が未定義の標準投影であり､かつﾎﾟｲﾝﾄを持たない場合には､ﾌｧｲﾙ内の座標系が自動的に使用され､ﾌﾟﾛｼﾞｪｸﾄ座標系はﾌｧｲﾙ内の座標系に変更します。


定義された座標系を持たないTotal Station ﾌｧｲﾙ（縮尺係数のみ）　－　概要

概要

縮尺係数のみの座標系は､すべての観測が一般装置で行われた測量（GPS測量なし）に対して使用されることができます。

一般測量しか含まないﾌｧｲﾙがTrimble Geomatics Officeでどのように扱われるかは､Trimble Geomatics Officeのﾌﾟﾛｼﾞｪｸﾄで定義された座標系によって決まります。

未定義の標準投影

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄが未定義の標準投影（原点緯度と原点経度なし）を持つ場合､標準投影ﾀﾞｲｱﾛｸﾞが表示されます。偽北距や偽東距､縮尺値を入力できます。

警告:ﾎﾟｲﾝﾄが既にﾃﾞｰﾀﾍﾞｰｽに存在する場合には､ﾌｧｲﾙの縮尺は標準投影を更新するのに使用されません。ｲﾝﾎﾟｰﾄされたﾌｧｲﾙの縮尺がﾌﾟﾛｼﾞｪｸﾄの標準投影の縮尺と同一であることを確認してください。

定義された座標系

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄが定義された座標系（原点緯度･経度値が定義された標準投影を含む）を持つ場合､ﾌﾟﾛｼﾞｪｸﾄ座標系が使用され､ﾌｧｲﾙ内の縮尺はﾌﾟﾛｼﾞｪｸﾄ座標系内の縮尺と同一と仮定されます。


縮尺係数のみのﾌｧｲﾙ（未定義の標準投影）の使用

概要と詳細

以下の場合､｢標準投影定義｣ﾀﾞｲｱﾛｸﾞが現れます。

ｲﾝﾎﾟｰﾄするﾌｧｲﾙが縮尺係数のみの投影法を含みます。

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄが未定義の標準投影を持ちます。（それは､原点緯度と原点経度が未定義であることを意味します。）

ﾃﾞｰﾀﾍﾞｰｽにﾎﾟｲﾝﾄがありません。

ﾀﾞｲｱﾛｸﾞは以下のﾌｨｰﾙﾄﾞを含みます。

偽北距

北距値はﾌｧｲﾙ内の最初のﾎﾟｲﾝﾄから引き出されます。偽北距の値は変更できます。

偽東距

東距値はﾌｧｲﾙ内の最初のﾎﾟｲﾝﾄから引き出されます。偽東距の値は変更できます。

縮尺係数

縮尺係数は､ﾌｧｲﾙの最後の縮尺ﾚｺｰﾄﾞから引き出されます。縮尺係数の値は変更できます。

ﾉｰﾄ：ﾌｧｲﾙ内の最初のﾎﾟｲﾝﾄを検索する時､削除されたﾎﾟｲﾝﾄは考慮されません。

OK

OKをｸﾘｯｸして､標準投影ﾊﾟﾗﾒｰﾀを受け入れます。こういった値は､ﾌﾟﾛｼﾞｪｸﾄに対する座標系を定義するのに使用されます。こういったﾊﾟﾗﾒｰﾀを見るには､ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ/座標系ﾀﾌﾞを選択してから詳細をｸﾘｯｸします。

ﾉｰﾄ：標準投影はそれでも完全に定義された訳ではないので､（原点緯度と原点経度は未定義です。）1つかそれ以上のGPSﾎﾟｲﾝﾄを含むﾌｧｲﾙをｲﾝﾎﾟｰﾄすることによって標準投影を更新することができます。

ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞの｢地面座標の使用｣ﾁｪｯｸﾎﾞｯｸｽがｵﾝでなければ､海面補正はｵﾌになっています。


定義されたﾌﾟﾛｼﾞｪｸﾄ座標系と共に一般測量のﾌｧｲﾙを使用

座標系がTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに対して定義されていて､ﾌｧｲﾙをｲﾝﾎﾟｰﾄする場合､ﾌﾟﾛｼﾞｪｸﾄの現存する座標系が使用されるというﾀﾞｲｱﾛｸﾞが表示されます。その後､ﾌｧｲﾙ内のﾎﾟｲﾝﾄがｲﾝﾎﾟｰﾄされます。

Trimble Geomatics Office は､現存する座標系のﾌﾟﾛｼﾞｪｸﾄ縮尺と､地面縮尺係数がﾌｧｲﾙ内の縮尺と同一であると仮定します。

ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞで｢地面座標の使用｣ﾁｪｯｸﾎﾞｯｸｽがｵﾝになっていない場合には､ｲﾝﾎﾟｰﾄ前に縮尺が完全に同一であり､ﾌｧｲﾙの縮尺係数が結合された縮尺係数に等しいことを確認する必要があります。

ﾛｰｶﾙｻｲﾄ設定ﾀﾞｲｱﾛｸﾞで｢地面座標の使用｣ﾁｪｯｸﾎﾞｯｸｽがｵﾝになっている場合には､ｲﾝﾎﾟｰﾄされようとしているﾃﾞｰﾀに対してTrimble Geomatics Officeの投影標高が正しいものかを確認します。


｢ﾌﾟﾛｼﾞｪｸﾄ座標系｣ﾀﾞｲｱﾛｸﾞ

ﾌｧｲﾙがｲﾝﾎﾟｰﾄされ､かつﾌｧｲﾙ内に記録された座標系定義がﾌﾟﾛｼﾞｪｸﾄに対する座標系定義と異なり､かつﾌﾟﾛｼﾞｪｸﾄ座標系が定義されている（それは､ﾌﾟﾛｼﾞｪｸﾄ座標系が未定義の標準投影でないことを意味します。）時にこのﾀﾞｲｱﾛｸﾞが現れます。

座標系

ﾌｧｲﾙ内の座標系を使用するには､｢ﾃﾞｰﾀｺﾚｸﾀｰ定義の変換｣を選択します。ﾃﾞｰﾀﾍﾞｰｽ内に現存するすべてのﾃﾞｰﾀは新しい座標系定義を使用して更新されます。

ﾌﾟﾛｼﾞｪｸﾄ座標系定義を保持するには､｢現存するﾌﾟﾛｼﾞｪｸﾄ定義の保持｣ｵﾌﾟｼｮﾝを選択します。ﾃﾞｰﾀｺﾚｸﾀｰﾌｧｲﾙ内のﾃﾞｰﾀはﾌﾟﾛｼﾞｪｸﾄ座標系定義を使用して解釈されます。

どちらかの座標系の詳細を見るには､該当する詳細ﾎﾞﾀﾝをｸﾘｯｸします。

要旨

要旨をｸﾘｯｸして､2つの座標系の比較ﾚﾎﾟｰﾄを見ることができます。座標系の完全ﾊﾟﾗﾒｰﾀを検査したり､その違いを見つけたりするのにそのﾚﾎﾟｰﾄを使用します。


ﾌｧｲﾙｲﾝﾎﾟ－ﾄ中の｢ﾌﾟﾛｼﾞｪｸﾄ座標系｣ﾀﾞｲｱﾛｸﾞの使用
ﾌｧｲﾙｲﾝﾎﾟｰﾄ中の｢ﾌﾟﾛｼﾞｪｸﾄ座標系｣ﾀﾞｲｱﾛｸﾞの使用

Survey Controller(*.dc)ﾌｧｲﾙがｲﾝﾎﾟｰﾄされる時､ﾌｧｲﾙ内に記録された座標系定義はﾌﾟﾛｼﾞｪｸﾄに対する座標系定義と比較されます。ﾌﾟﾛｼﾞｪｸﾄで特定された座標系を使用するには､｢ﾌﾟﾛｼﾞｪｸﾄ座標系｣ﾀﾞｲｱﾛｸﾞの｢現存するﾌﾟﾛｼﾞｪｸﾄ定義の保持｣ｵﾌﾟｼｮﾝを選択します。

未定義の標準投影

ﾌﾟﾛｼﾞｪｸﾄ座標系が未定義の標準投影である場合､標準投影の更新が表示されます。ﾌｧｲﾙ内の最初のﾎﾟｲﾝﾄは標準投影の更新に使用されます。

その他の座標系

ﾌｧｲﾙはﾌﾟﾛｼﾞｪｸﾄ座標系を使用してｲﾝﾎﾟｰﾄされます。

ﾉｰﾄ：ﾌｧｲﾙ内の座標系が縮尺係数のみである場合には､何が起こるかはﾌﾟﾛｼﾞｪｸﾄに対して定義された座標系によって決まります。


Trimble Survey OfficeかTrimble Survey Controllerから平面投影を使用

Trimble Geomatics Office は､未定義の平面投影を更新しません。

以下の1つを行うと､

Trimble Survey Officeﾌﾟﾛｼﾞｪｸﾄが平面投影を持つ場合､Trimble Survey Office からTrimbleｸﾞﾗﾌｨｯｸｽﾌｧｲﾙ(*.tgf)をｴｸｽﾎﾟｰﾄします。

Trimble Survey Office ﾌﾟﾛｼﾞｪｸﾄから.dcを平面投影と一緒にｴｸｽﾎﾟｰﾄします。

そして､Trimble Geomatics Office にﾌｧｲﾙをｲﾝﾎﾟｰﾄすると､平面投影はその後もTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄで使用することができます。（｢ﾌﾟﾛｼﾞｪｸﾄ座標系｣ﾀﾞｲｱﾛｸﾞが表示される時に｢ﾌｧｲﾙ座標系を使用｣ｵﾌﾟｼｮﾝを選択する必要があります。）

平面投影は､ﾌﾟﾛｼﾞｪｸﾄに対して選択された座標系になります。座標系の詳細を見るために､｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞ/座標系ﾀﾌﾞを使用します。


縮尺係数のみのﾌｧｲﾙ（未定義の標準投影）からのﾃﾞ－ﾀと共に網平均を実行
縮尺係数のみのﾌｧｲﾙ（未定義の標準投影）からのﾃﾞｰﾀと共に網平均を実行

一般測量ﾃﾞｰﾀﾌｧｲﾙ（それはGPS観測を含まないものです）は､縮尺以外に定義されたﾊﾟﾗﾒｰﾀを持たない座標系を持つことがあります。それは､測地変換や平面調整､高度調整を持たないことを意味します。縮尺係数のみの座標系はTrimble Survey Controller （ﾊﾞｰｼﾞｮﾝ7.00以上）で作成されます。

網平均を実行できるようになる前に座標系を定義する必要があります。そのために､Trimble Survey Controller から､Trimble Geomatics Office の未定義の標準ﾌﾟﾛｼﾞｪｸﾄ座標系に､縮尺係数のみのｼﾞｮﾌﾞをｲﾝﾎﾟｰﾄした場合には､ｿﾌﾄｳｪｱは未定義の投影を更新するように要求します。

表示されるﾀﾞｲｱﾛｸﾞに､標準原点と偽北距､偽東距座標に対する緯度と経度を入力する必要があります。


地球自転ﾊﾟﾗﾒｰﾀ

100 km以上の基線を処理する場合､基線ﾌﾟﾛｾｯｻは極潮をﾓﾃﾞﾙとするために地球自転ﾊﾟﾗﾒｰﾀを使用します。

こういった地球自転ﾊﾟﾗﾒｰﾀは､特に極座標は､IGS（国際GPSｻｰﾋﾞｽ）のような機関から.erpﾌｧｲﾙとして毎週入手できます。基線の時に.erpﾌｧｲﾙが利用できない場合には､予測された極座標が使用されます。

Windows Explorer を使用して､ﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞ内のﾃﾞｰﾀﾌｧｲﾙ/精密な軌道歴ﾌｫﾙﾀﾞに該当する.erpﾌｧｲﾙすべてをｺﾋﾟｰします｡基線ﾌﾟﾛｾｯｻは､必要時には自動的にこういったﾌｧｲﾙを探します。

ﾉｰﾄ: 複数のﾌﾟﾛｼﾞｪｸﾄに .erpﾌｧｲﾙを使用する場合には､それぞれのﾌﾟﾛｼﾞｪｸﾄにそのﾌｧｲﾙをｺﾋﾟｰする必要があります｡


高精度測地ﾈｯﾄﾜｰｸ

US State Plane ｼｽﾃﾑに対するHPGN (高精度測地ﾈｯﾄﾜｰｸ)測地ｸﾞﾘｯﾄﾞﾌｧｲﾙは､Trimble Geomatics Office ｼｽﾃﾑのｲﾝｽﾄｰﾙの一部として提供されています｡測地ｸﾞﾘｯﾄﾞﾌｧｲﾙは､Trimble 共有ﾌｧｲﾙﾌｫﾙﾀﾞにあるGeoData ﾌｫﾙﾀﾞ(通常はﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\共有ﾌｧｲﾙ\Trimble\GeoData)に保管されています｡HPGN 測地ｸﾞﾘｯﾄﾞﾌｧｲﾙは､米国全ての州で使用できるわけではありません｡

ｸﾞﾘｯﾄﾞﾌｧｲﾙの名付け規則は､

州を示す2文字+hpgn +la (緯度)またはlo (経度)､そしてその後にﾌｧｲﾙの拡張子.dgf が付きます。例えば､ｶﾘﾌｫﾙﾆｱHPGN ｸﾞﾘｯﾄﾞﾌｧｲﾙは､Cahpgnla.dgf とCahpgnlo.dgf です。

Trimble Geomatics Office の座標系管理はWGS-84 楕円体を基礎としているので､HPGN 測地ｸﾞﾘｯﾄﾞ(NAD83 (1986)とNAD83 (HPGN)間の双方向変換のために設計された)はこの座標系ﾓﾃﾞﾙと完全には一致しません。そのために､そして混同を防ぐために､ｿﾌﾄｳｪｱはこの測地ｸﾞﾘｯﾄﾞを基準とする予め定義された座標系定義を提供しません。

座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨで適切なHPGN 測地ｸﾞﾘｯﾄﾞﾌｧｲﾙを使用する独自の測地と座標系の定義を設定できます。

それを行うには､

1.	その州に対して適切なHPGN 測地ｸﾞﾘｯﾄﾞﾌｧｲﾙを基準とする新しい測地定義を作成します。

2.	適切なState Plane 投影ﾊﾟﾗﾒｰﾀを使用して､新しく作成された測地定義を基準とする､新しい座標系定義を作成します。

Trimble Geomatics Office ﾌﾟﾛｼﾞｪｸﾄの新しい座標系定義を使用して､既知のHPGN投影座標か緯度､経度､高度の値からNAD-83 (1986)緯度と経度値を求めます。

以下を行います｡

1.	HPGN 値（または､該当するﾛｰｶﾙ緯度､経度､高度値）をｸﾞﾘｯﾄﾞ座標として入力します。

2.	表示されたWGS-84 ﾌｨｰﾙﾄﾞから同等なNAD-83 (1986)緯度と経度値を読み取ります。

既知のNAD-83 (1986)緯度､経度､高度値からHPGN値を求めます。

1.	WGS-84 値として既知のNAD-83 (1986)緯度､経度､高度値を入力します。

2.	同等なHPGN ｸﾞﾘｯﾄﾞ座標（またはｸﾞﾘｯﾄﾞとﾛｰｶﾙﾌｨｰﾙﾄﾞそれぞれから緯度､経度､高度値）を読み取ります｡


New Brunswick (ｶﾅﾀﾞ)座標系

座標系ﾃﾞｰﾀﾍﾞｰｽは､二重平射投影法と平均一般測量ｼｽﾃﾑ1977 (ATS77)楕円体を持ちます｡New Brunswick 座標系を設定する前に､Geodetic Survey of Canada から測地ｸﾞﾘｯﾄﾞとｼﾞｵｲﾄﾞﾓﾃﾞﾙを購入する必要があります。

New Brunswick (ｶﾅﾀﾞ)座標系は以下を使用します｡

楕円体:ATS77

測地:NTv2 測地ｸﾞﾘｯﾄﾞ

ｼﾞｵｲﾄﾞ:HT101

投影:二重平射:

� 中央緯度: 46° 30' 00" N

� 中央経度: 66° 30' 00" W

� 偽北距: 800 000 m

� 偽東距: 300 000 m

� 縮尺係数: 0.999912

New Brunswick (ｶﾅﾀﾞ)座標系を作成するには以下を行います。

1.	ｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰﾕｰﾃｨﾘﾃｨを使用して､Geodetic Survey of Canada から購入したHT101ｼﾞｵｲﾄﾞﾓﾃﾞﾙからｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞ(*.ggf)ﾌｧｲﾙを作成します｡

2.	ｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰﾕｰﾃｨﾘﾃｨを使用して､Geodetic Survey of Canada から購入したNTv2 測地ｸﾞﾘｯﾄﾞから測地ｸﾞﾘｯﾄﾞ(*lat.dgf,*lon.dgf)ﾌｧｲﾙを作成します｡詳しくは､ｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰﾕｰﾃｨﾘﾃｨのﾍﾙﾌﾟを参照してください。

3.	座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨを使用して､新しい座標系を追加します｡詳しくは､座標系ﾏﾈｰｼﾞｬﾕｰﾃｨﾘﾃｨのﾍﾙﾌﾟで座標系の追加ｺﾏﾝﾄﾞの項目を参照してください｡


用語集

この用語集は，GPS とTrimble Geomatics Office ソフトウェアにとって特別な用語を定義します。これには，Microsoft Windowsや一般コンピュータ用語は含まれません。

記号

1シグマ(1 sigme)

1周波(single-frequency)

1点測位(point positions)

1変量(univariate)

2周波(dual-frequency)

2重差計算(double difference)

2変量(bivaridate)

τ(タウ)(値)(tau (value))

τ(タウ)検定(tau criterion)

χ自乗テスト(chi-square test)

あ

後処理(postprocess)

アルゴリズム(algorithm)

アンチ・スプーフィング(Anti-Spoofing)(AS )

アンテナ位相中心(APC )

アンテナ高(antenna height)

アンテナ位相補正(antenna height)

アンビギュイティ(ambiguity)

位相中心(phase center)

位相中心モデル(phase center models)

一般測量機の観測(terrestrial observation)

移動局(rover)

イベント(events)

衛星群(constellation)

衛星の幾何学的配置(satellite geometry)

衛星暦(almanac)

エポック(epoch)

エポック間隔(epoch interval)

鉛直にする(plumbing)

エンティティ(entities)

か

回転(rotation)

回転子午線(rotated meridian)

解のタイプ(solution types)

海抜高(orthometric height)

確率(probability)

カーテジアン(デカルト)座標(Cartesian coodinates)

観測(observations)

観測残差(observation residual)

環閉合(loop closure)

記号とラインタイプ(symbols and line types)

基準局(reference station)

基準点(control point)

基準フレーム(reference frame)

基線(baseline)

基線解析(baseline processor)

基地局(base station)

既知点初期化(known point initialization)

軌道暦(ephemeris)

キネマティック測量(kinematic surveying)

キャリブレーション座標(calibration coordinates)

キャリブレートされたサイト(calibrated site)

共分散(covariance)

共分散行列(covariance matrix)

共分散を除く(de-correlate)

共変値(covariant values)

仰角マスク(elevation mask)

グリッド(grid)

グリッド距離(grid distance)

グリッド変換(grid conversion)

系統的誤差(systematic errors)

現在の表示(current view)

原点(origin)

高速静止(FastStatic)

高度計測ロッド(height measurement rod)

高度平均(vertical adjustment)

後験的誤差(a posteriori errors)

誤差(error)

誤差楕円(error ellipsoid)

固定(constraint)

固定座標(fixed coordinates)

固定される(constrained)

固定される(fixed)

コード(code)

さ

サイクルスリップ(cycle slip)

最終解(final solution)

最小固定(minimally constrained)

最小自乗法(least squares)

サイトキャリブレーション(site calibration)

サイドショット(side-shot)

座標系(coodinate system)

サブ網(subnetwork)

算術記号(algebraic sign)

残差(residual)

ジオイド(geoid)

ジオイド観測(geoid observation)

ジオイド比高(geoid separation)

ジオイドモデル(geoid model)

ジオマティクス(Geomatics)

シグマ(sigma)

斜距離(slope distance)

自由度(degree of freedom)

自由平均(free adjustment)

重複決定(over-determined)

従来の観測，一般測量機の観測(conventional observation)

縮尺(scale)

冗長度(redundancy)

冗長度数(redundancy number)

冗長な観測(redundant observation)

冗長な基線(redundant baseline)

信頼度(level of confidence)

推計学モデル(stochasic model)

水準点(vertical control point)

垂直(vertical)

垂直線偏差(deflection of the vertical)

推定値(probable value)

水平位置(horizontal position)

水平基準点(horizontal control point)

水平距離(horizontal distance)

スカイプロット(sky plot)

スケール(scalar)

スケール重量(scalar weighting)

ステータス(status)

スーパートラック(Super-track)

正規分布曲線(normal distribution curve)

静止(測量)(static (surveying))

静止観測時間(occupation time)

静止網(static network)

整準台(tribrach)

整準台中心誤差(tribrach centering errors)

整数値アンビギュイティ(あいまいさ)(integer ambiguity)

整数値サーチ(integer search)

精度(accuracy)

成分(component)

精密軌道暦(precise ephemeris)

精密度(precise)

セッション(session)

設置誤差(set-up error)

セレクティブアベイラビリティ(Selective Availability)(S/A )

先験的誤差(a prior errors)

全点固定(fully contrained)

相関関係にある(correlated)

相対誤差(relative errors)

測地系(datum)

測地系の差(datum defect)

測地系変換(datum transformation)

測地座標系(geodetic datum)

測地方位角(geodetic azimuth)

測量観測(surveying observations)

た

対流圏補正(tropo correction)

対流圏モデル(tropo model)

楕円体(ellipsoid)

楕円体距離(ellipsoid distance)

楕円体高度(ellipsoid height)

単位重量の標準誤差(standard error of unit weight)

短軸(minor axis)

単独測位(autonomous positioning)

短半径(semiminor axis)

地心座標(Earth-Centered-Earth-Fixed)(ECEF)

地図投影(mapping projection)

地表距離(ground distance)

注釈(annotation)

長軸(major axis)

調整値(adjusted values)

長半径(semimajor axis)

重量(weight)

重量セット(weights)

重量戦略(weighting strategy)

直角座標(retangular coordinates)

地理座標(geographic coodinates)

ディファレンシャル測位(differential positioning)

データメッセージ(data message)

データロギング(data logging)

デルタN，デルタE，デルタU (delta N,delta E,delta U)

デルタX，デルタY，デルタZ (delta X,delta Y,delta Z)

デルタ高度(delta height)

天頂遅延(zenith delay)

伝搬誤差(propagated error)

電離層(ionosphere)

電離層フリー(iono free)

電離層モデル(ionospheric model)

投影(projection)

東距(easting)

特徴コード(feature code)

特徴･属性ライブラリファイル(feature and attribute library file)(*.fcl )

独立した(independent)

時計オフセット(clock offset)

度数分布(frequency distribution)

ドップラーシフト(Doppler shift)

トラッキング，捕捉(tracking)

な

内部的固定(inner constraints)

ナローレーン(narrow-lane)

は

パラメータ(parameter)

パリティ(parity)

反復(iteration)

範囲外，異常値(outlier)

ヒストグラム(histogram)

標高(elevation)

標高差(delta elevation)

標準誤差(standard error)

合格検査(quality acceptance test)品質

フィックス解(fixed solution)

フィールドコード(field code)

プロジェクト(project)

プロジェクト測地系(project datum)

フロート解(float solution)

分散(variance)

分散･共分散行列(variance-covariance matrix)

分散グループ(variance component group)

分散成分の推定(variance component estimation)

平均海面高(mean sea level)

閉合(closure)

平面座標(State Plane Coordinates)

ベクトル(vector)

変換(transformation)

変換グループ(transformation parameter group)

変換パラメータ(transformation parameters)

扁平度(flatting)

扁平度の逆数(flatting inverse)

ボー(baud)

方位角(azimuth)

法線(normal)

北距(northing)

ま

マッピングアングル(Mapping Angle)

マルチパス(multipath)

未知量(unknowns)

網(network)

網ステータス(network status)

網平均(adjustment)

網平均(network adjustment)

網平均スタイル(adjustment styles)

網平均測地系(adjustment datum)

網平均の収束(adjustment convergence)

モデル化(modeling)

や

有意性(level of significance)

ら

ラベル(label)

リアルタイムキネマティック(Real-Time kinematic)

リアルタイムキネマティック(RTK)

リファレンスバリアンス，基準分散(reference variance)

リファレンスファクタ(reference factor)

レイヤー(layer)

レシオ(ratio)

ローカル測地座標(local geodetic coordinates)

ローカル測地水平面(local geodetic horizon)

ローカル楕円体(local ellipsoid)

わ

ワイドレーン(wide-lane)

A

(a posteriori errors)後験的誤差

(a prior errors)先験的誤差

AASHTO

(accuracy)精度

(adjusted values)調整値

(adjustment)網平均

(adjustment convergence)網平均の収束

(adjustment datum)網平均測地系

(adjustment styles)網平均スタイル

(algebraic sign)算術記号

(algorithm)アルゴリズム

(almanac)衛星暦

(ambiguity)アンビギュイティ

(annotation)注釈

(antenna height)アンテナ高

(antenna height)アンテナ位相補正

(Anti-Spoofing)アンチ・スプーフィング(AS )

(APC )アンテナ位相中心

(autonomous positioning)単独測位

(azimuth)方位角

B

(base station)基地局

(baseline)基線

(baseline processor)基線解析

(baud)ボー

(bivaridate)2変量

C

(CAD styles)CADスタイル

(calibrated site)キャリブレートされたサイト

(calibration coordinates)キャリブレーション座標

(Cartesian coodinates)カーテジアン(デカルト)座標

(chi-square test)χ自乗テスト

(clock offset)時計オフセット

(closure)閉合

CMR

(Coarse Acquision (C/A)code)C/A コード

(code)コード

(component)成分

(constellation)衛星群

(constrained)固定される

(constraint)固定

(control point)基準点

(conventional observation)従来の観測，一般測量機の観測

(coodinate system)座標系

(correlated)相関関係にある

(covariance)共分散

(covariance matrix)共分散行列

(covariant values)共変値

(current view)現在の表示

(cycle slip)サイクルスリップ

D

(data logging)データロギング

(data message)データメッセージ

(datum)測地系

(datum defect)測地系の差

(datum transformation)測地系変換

(de-correlate)共分散を除く

(deflection of the vertical)垂直線偏差

(degree of freedom)自由度

(delta elevation)標高差

(delta height)デルタ高度

(delta N,delta E,delta U)デルタN，デルタE，デルタU

(delta X,delta Y,delta Z)デルタX，デルタY，デルタZ

(differential positioning)ディファレンシャル測位

DOP

(Doppler shift)ドップラーシフト

(double difference)2重差計算

DTM

(dual-frequency)2周波

E

(Earth-Centered-Earth-Fixed)地心座標(ECEF)

(easting)東距

(elevation)標高

(elevation mask)仰角マスク

(ellipsoid)楕円体

(ellipsoid distance)楕円体距離

(ellipsoid height)楕円体高度

(entities)エンティティ

(ephemeris)軌道暦

(epoch)エポック

(epoch interval)エポック間隔

(error)誤差

(error ellipsoid)誤差楕円

(events)イベント

F

(FastStatic)高速静止

(feature and attribute library file)特徴･属性ライブラリファイル(*.fcl )

(feature code)特徴コード

(field code)フィールドコード

(final solution)最終解

(fixed)固定される

(fixed coordinates)固定座標

(fixed solution)フィックス解

(flatting)扁平度

(flatting inverse)扁平度の逆数

(float solution)フロート解

(free adjustment)自由平均

(frequency distribution)度数分布

(fully contrained)全点固定

G

GDOP

(geodetic azimuth)測地方位角

(geodetic datum)測地座標系

(geographic coodinates)地理座標

(geoid)ジオイド

(geoid model)ジオイドモデル

(geoid observation)ジオイド観測

(geoid separation)ジオイド比高

(Geomatics)ジオマティクス

GPS

(GPS baseline)GPS基線

(GPS observation)GPS観測

(GPS raw data)GPS生データ

(GPS time)GPS時刻

(grid)グリッド

(grid conversion)グリッド変換

(grid distance)グリッド距離

(ground distance)地表距離

H

HDOP

(height measurement rod)高度計測ロッド

HI

(histogram)ヒストグラム

(horizontal control point)水平基準点

(horizontal distance)水平距離

(horizontal position)水平位置

I

(independent)独立した

(inner constraints)内部的固定

(integer ambiguity)整数値アンビギュイティ(あいまいさ)

(integer search)整数値サーチ

(iono free)電離層フリー

(ionosphere)電離層

(ionospheric model)電離層モデル

(iteration)反復

J

K

(kinematic surveying)キネマティック測量

(known point initialization)既知点初期化

L

L1

L2

(label)ラベル

(layer)レイヤー

(least squares)最小自乗法

(level of confidence)信頼度

(level of significance)有意性

(local ellipsoid)ローカル楕円体

(local geodetic coordinates)ローカル測地座標

(local geodetic horizon)ローカル測地水平面

(loop closure)環閉合

M

(major axis)長軸

(Mapping Angle)マッピングアングル

(mapping projection)地図投影

(mean sea level)平均海面高

(minimally constrained)最小固定

(minor axis)短軸

(modeling)モデル化

(multipath)マルチパス

N

(narrow-lane)ナローレーン

NAVDATA

(network)網

(network adjustment)網平均

(network status)網ステータス

NMEA

(normal)法線

(normal distribution curve)正規分布曲線

(northing)北距

O

(observation residual)観測残差

(observations)観測

(occupation time)静止観測時間

(origin)原点

(orthometric height)海抜高

(OTF search method)OTFサーチモード

(outlier)範囲外，異常値

(over-determined)重複決定

P

(P-code)Pコード

(parameter)パラメータ

(parity)パリティ

PDOP

(PDOP cutoff)PDOPカットオフ

(PDOP mask)PDOPマスク

(phase center)位相中心

(phase center models)位相中心モデル

(plumbing)鉛直にする

(point positions)1点測位

(postprocess)後処理

PPM

(precise ephemeris)精密軌道暦

(precise)精密度

PRN

(probability)確率

(probable value)推定値

(project)プロジェクト

(project datum)プロジェクト測地系

(projection)投影

(propagated error)伝搬誤差

Q

(quality acceptance test)品質合格検査

(QC records)QCレコード

R

(ratio)レシオ

RDOP

(Real-Time kinematic)リアルタイムキネマティック

(retangular coordinates)直角座標

reduced column profile

(redundancy)冗長度

(redundancy number)冗長度数

(redundant baseline)冗長な基線

(redundant observation)冗長な観測

(reference factor)リファレンスファクタ

(reference frame)基準フレーム

(reference station)基準局

(reference variance)リファレンスバリアンス，基準分散

(relative errors)相対誤差

(residual)残差

RINEX

RMS

(rotated meridian)回転子午線

(rotation)回転

(rover)移動局

RTCM

(RTK)リアルタイムキネマティック

S

(satellite geometry)衛星の幾何学的配置

(scalar)スケール

(scalar weighting)スケール重量

(scale)縮尺

SDMS

(Selective Availability)セレクティブアベイラビリティ(S/A )

(semimajor axis)長半径

(semiminor axis)短半径

(session)セッション

(set-up error)設置誤差

(side-shot)サイドショット

(sigma)シグマ

(single-frequency)1周波

(site calibration)サイトキャリブレーション

(sky plot)スカイプロット

(slope distance)斜距離

SNR

(solution types)解のタイプ

(standard error)標準誤差

(standard error of unit weight)単位重量の標準誤差

(State Plane Coordinates)平面座標

(static (surveying))静止(測量)

(static network)静止網

(status)ステータス

(stochasic model)推計学モデル

(subnetwork)サブ網

(Super-track)スーパートラック

(surveying observations)測量観測

SV

(symbols and line types)記号とラインタイプ

(systematic errors)系統的誤差

T

(tau (value))τ(タウ)(値)

(tau criterion)τ(タウ)検定

TDOP

(terrestrial observation)一般測量機の観測

TOW

(tracking)トラッキング，捕捉

(transformation)変換

(transformation parameter group)変換グループ

(transformation parameters)変換パラメータ

(tribrach)整準台

(tropo correction)対流圏補正

(tropo model)対流圏モデル

(tribrach centering errors)整準台中心誤差

U

(univariate)1変量

(unknowns)未知量

URA

US National

(US Survey Foot)US測量フィート

UTC

V

(variance)分散

(variance component estimation)分散成分の推定

(variance component group)分散グループ

(variance-covariance matrix)分散･共分散行列

VDOP

(vector)ベクトル

(vertical)垂直

(vertical adjustment)高度平均

(vertical control point)水準点

W

wave

(weight)重量

(weighting strategy)重量戦略

(weights)重量セット

WGS-84

(wide-lane)ワイドレーン

X

X，Y，Z

Y

(Y-code)Yコード

Z

(zenith delay)天頂遅延


1シグマ

平均値に対する1標準誤差。


後験的誤差

網平均の結果として起こる単位重量(リファレンスファクター)の標準誤差によって増大された後験的誤差。


先見的誤差
先験的誤差

網平均前の観測に対して推定される誤差。


AASHTO

米国国道･交通局員協会(American Association of State Highway and Transportation Officials )


精度

観測量の実際の( 真の )値に対する正確さ。


網平均値

網平均において，そのデータに存在する誤差を消去する処理を適用することで観測データ( 計測 )から導かれた値。


網平均

網平均において，誤差を減らす目的で観測に対して補正を決定し適用する処理。


網平均収束

網平均が，定義された反復数内に定義された残差許容値，または最終収束カットオフの残差許容値に適合した時。


網平均測地系

現在の網平均計算の反復で使用される測地系。Trimble Geomatics Officeソフトウェアでは，プロジェクトの測地系，またはWGS-84を選択することができます。


網平均スタイル

網平均のためのTrimble 標準設定とユーザ定義される設定。


算術符号

その数がプラスかマイナスかを示す，値に関連した符号(＋や－)。


アルゴリズム

限定された手順で問題解決する一連の規則。


衛星暦

すべての衛星の軌道情報や，時計補正，大気遅延パラメータを含む，GPS衛星によって送信されるデータ。

衛星暦により衛星をすばやく捕捉できます。軌道情報は，軌道暦データの一部ですが精度を低くなっています。


アンビギュイティ

中断されない観測データに含まれる再生された搬送波の未知のサイクル数の整数値。受信機は高い精度で無線電波(衛星からアンテナを通った時を)を数えます。しかし，数え始めた時は衛星の波の数の情報はありません。この衛星とアンテナ間の波長の数の未知数がアンビギュイティです。これは整数値アンビギュイティ(Integer Ambiguity )または整数値バイアス(Integer bias )としても知られています。


注釈

別のデータベースレコードを記述するテキスト。注釈を選択し編集するためにはプロパティウィンドウを使用します。

注釈は一過性のものです。すべてのフィールドはその親エンティティが変更する度に更新されます。


アンテナ高

観測されるポイント上のGPSアンテナの位相中心の高さ。

未補正のアンテナ高は，観測点からアンテナ上の指定されたポイントまで測定され，その後ソフトウェア内で自動に，またはユーザによって垂直高に補正されます。


アンテナ位相補正

GPSアンテナの位相中心は物理的でもなければ安定した点でもありません。GPSアンテナの位相中心は衛星からの信号の方向の変移に伴って変わります。ほとんどの位相中心の変動は，衛星の仰角に左右されます。アンテナ位相中心の位置に関する変動をモデル化することは，1つの測量でいろいろな種類のアンテナを使用できることを意味します。2つの同じアンテナが使用される場合，共通の誤差が取消されるのでアンテナ位相中心補正はそれほど重要ではありません。


アンチ・スプーフィング(AS )

米国国防総省がPコードの代わりに暗号化されたYコードを送信する機能。Yコードは許可された(主に軍)ユーザのみが使用できます。アンチスプーフィングは民間の利用者にGPS の完全な精度を与えないセレクティブアベイラビリティと共に使用されます。


アンテナ位相中心(APC )

Antenna Phase Center

アンテナの電気的中心。それがアンテナの物理的中心とは一致しないことがよくあります。無線信号はAPCで計測されます。

プロパティウィンドウではポイントの高さはAPCの標高であることもあります。高度がAPCと特定されている場合，それはAPCの高さであり，地面の高さではありません。


単独測位

基準局によって提供される基準のデータなしに，衛星のデータのみからリアルタイムで測位計算するGPS受信機の動作モード。単独測位はGPS受信機が実行する最も精度の悪い測位で，セレクティブアベイラビリティの影響がある場合は水平で±100メートルRMS，影響のない場合は±10から20メートルの精度です。また，絶対測位(absolute positioning )または1点測位(Point positioning )としても知られています。


方位角

水平基線と測地の北によって形成される角度を計測するために使用される測量観測。GPS観測に適用する場合，それは測地方位角と呼びます。


基準局
基地局

ある既知点に設置されたアンテナと受信機。リアルタイムキネマティック(RTK )あるいはディファレンシャル測量に使用されます。データは後の後処理のために基地局で記録することができます。Trimble Reference Station(TRS )ソフトウェアや，Trimble Universal Reference Station(URS )ソフトウェアのようなTrimble の基準局(reference station )や，基地局モードの受信機等がその例です。

実際のGPS 測量では，基線(ある受信機から別の受信機への相対的な位置)を観測して計算します。基地局は，未知の座標を導くための基点となります。


基線

あるポイントから別のポイントへの相対的な位置。GPS測量では，これはある受信機から別の受信機への相対的な位置です。この2つの受信機からのデータを混合すると，その結果は2つのステーション間の3Dベクトルの基線になります。


基線解析プログラム

衛星の観測から基線解を計算するコンピュータプログラム。パーソナルコンピュータの後処理，または受信機内でリアルタイム計算を行います。WAVE(Weighted Ambiguity Vector Estimator )はTrimble の基線解析プログラムです。


baud(ボー)

シリアル通信を表現する時に使用されるデータ転送(ある二進法のデジタル装置から別へ)スピードの単位。


2変量

以下に関する誤差楕円の任意の二次元誤差を表現する数学的機能：

北距と東距

経度と緯度

XとY


CADスタイル

CADスタイルは，プロジェクトでにおいてイント，ライン，円弧，曲線，テキスト，注釈の表示を定義します。例えば，スタイルは記号，ラインタイプ，色，フォントなどから構成されます。スタイルの定義はプロジェクトに保存されます。

複数のプロジェクトで1つのスタイルを利用するには，テンプレートプロジェクトでスタイルを定義します。


キャリブレートされたサイト

サイトの定義は，既存の座標系定義と補正変換を使用します。これにより，GPSデータと特定の区域(またはサイト)は最適化されます。

座標系は非常に広い区域に適用するよう設計されているので追加の補正変換が必要になります。それにより，ローカル座標のばらつきがなくなります。

既存の基準点に適合する新しい作業が必要となり，追加の補正変換がそういったローカルのばらつきを補正します。こういった追加の補正は，限られた区域にのみ有効です。これは専門用語｢サイト｣を意味します。

Trimble Geomatics Officeソフトウェアは，ローカルの基準点に適合するために必要な追加の変換を計算し，その定義を座標系データベースに保存することができます


キャリブレーション座標

GPS観測の仮定網平均から生成され，後にGPSサイトキャリブレーションで使用するために保存されたWGS-84座標(緯度/経度/楕円体高度)。

キャリブレーション座標は，キャリブレーションを行う時に特定ポイントのグリッド座標に対応するGPS観測座標として使用されます。


カーテジアン(デカルト)座標

地心座標を参照。


χ自乗検定

網平均の全般的統計上の検定。それは，残差の重量2乗，自由度数，95％以上の決定的な確率の和の検定です。

この検定の目的は，予想された誤差は正確に推定された，という仮説を受け入れるか棄却するかを判定することです。


クロックオフセット

2つの時計間で読み取られる一定の時間差。GPSでは通常，衛星の時計と受信機の時計の差をいう。


閉合

網の観測部分と既知部分の間の一致。


CMR

Compact Measurement Record

衛星観測のメッセージ。基準受信機から移動受信機までの精確な基線を計算するために，基準局受信機によって放送され，リアルタイムキネマティク(RTK )測量に使用されます。


C/A コード

L1信号に変調されている擬似ランダム雑音(PRN )コード。このコードにより，受信機は衛星からの距離を計算できます。


コード

GPSコードは，GPS搬送波上に変調された擬似ランダム雑音(PRN )コードです。

C/Aコードは機密扱いではないので民生アプリケーションに使用できます。

Pコードも既知で機密扱いではありませんが，国家防衛目的で暗号化されているかもしれません。

コード観測はGPSナビゲーションと測位の基本です。より正確な測量の質の基線解を得るために，搬送波位相の観測と組み合わせて使用されることもあります。


成分

2つのポイント間の3次元の基線を定義するために使用される3つの測量観測の1つ。1つの基線は，方位角，高度差，距離(楕円体座標上)，またはデルタX，デルタY，デルタZ(地心座標)によって，またはデルタ北距，デルタ東距，デルタ標高(ローカル平面座標上)によって定義することができます。


衛星群

位置を計算するために使用される特定の衛星群。(2Dフィックスの場合は3つの衛星，3Dフィックスの場合は4つの衛星)

GPS受信機から同時に見ることができるすべての衛星。最適な衛星群とは最も低いPDOPを持つ衛星群です。PDOP参照。


固定される(Constrained )

網平均において真の値であるように数量( 観測と座標 )を保つ( 固定する )こと。


固定(Constraint )

網平均において平均可能な数量( 観測と座標 )に外部から強制された制限。


基準点

測量観測により座標を割り当てられた，または座標を割り当てるために解析している標石のあるポイント。


従来の観測，一般測量機の観測

トータルステーションか経緯儀を使用して得られた，フィールドでの観測。


座標系

GPS座標(WGS-84楕円体上の)をジオイド上の標高を持つ投影座標に変換する，一連の変換。

測地系変換，ジオイドモデル，座標投影定義から構成されます。

測地系変換は座標系データベースに定義されます。これには座標投影が基準とした測地系の定義を含みます。

既存のジオイドモデルは座標系に割り当てることができますが，ジオイドモデルを使用せずに一定のジオイド高を指定することもできます。座標系データベースでジオイドモデルを定義するにはTrimble Coordinate System Manager™(座標系マネージャ)ユーティリティを使用します。

座標系にいくつかの座標投影タイプを割り当てることができます(例：横メルカトールやランベルト1標準緯線)。国や地方によっては投影座標において最適な結果を得る(つまり歪みを最少にする)ために異なる投影タイプを使用することがあります。座標投影方法は，適切な測地系の緯度と経度を地心座標値に投影します。投影座標の標高は座標系に割り当てられたジオイドモデルを使用して得られます

Trimble Coordinate System Manager ユーティリティは，Trimble Geomatics Officeソフトウェアと共に提供された座標系定義の表示，編集，追加ができます。


相関関係にある

少なくとも1つの共通の誤差源を持つ2つ以上の観測( または導かれた数量 )を相関関係にあると言います。


共分散

2つの観測，または生成された数量間の誤差の相関の統計的な測定。分散･共分散行列の対角行列以外( つまり，分散でない )についても参照します。


共分散行列

行列は観測の分散と共分散を定義します。対角成分は分散，対角の両側のすべての成分は共分散です。


共変値

Trimble Geomatics Officeソフトウェアによって使用されるように，これは網平均の結果として起こる2つのポイント間の方位角，距離，高度における伝播(計算)された帰納的誤差の結果です。用語共変は，この計算が平均されたポイントの分散･共分散行列における共変項を使用していることを示します。


現在の表示

ウィンドウ/新しいウィンドウコマンドを使用してデータベースに対して1つ以上の画面を開くことができます。これらの画面はそれぞれ異なる表示設定が可能です。現在の表示とは，使用中の画面で，アクティブなタイトルバーの使用により判別できます。


サイクルスリップ

衛星の無線信号の捕捉の中断。サイクルスリップは基線の解析時に整数値のあいまいさを再度推定する必要があります。


データロギング

受信機，Trimble Survey Controller ソフトウェアが動作しているデータコレクタ，PCカードに収録されるファイルに衛星のデータを記録する過程。


データメッセージ，航法メッセージ

GPS信号に含まれ，時計補正だけでなく衛星の位置と健康状態を報告するメッセージ。それには，その他の衛星のほぼ正確な位置だけでなくその健康状態に関する情報も含まれます。


測地系

ジオイドの一部，または全部に適合するよう設計された地球の数学的モデル。それは，楕円体と測地系の原点として設定された地形表面上の点との関係によって定義されます。

通常，楕円体のサイズや形と，地球の中心に対する楕円体の中心の位置が世界地理測地系を定義します。


測地系の差

2つの座標系の間の確認できない差で，網平均の一部である測地系変換を使用してのみ修正が可能。


測地系変換

ある測地系で定義されたポイントの座標を別の測地系の座標に変換するのに使用される変換を定義します。

Trimble Geomatics Officeソフトウェアはいくつかの異なる測地系変換方法をサポートします。

7パラメータ

3パラメータ(モロデンスキーとも呼ばれる)

測地グリッド

Multiple Regression

測地系変換は通常，GPSによりWGS-84 測地系で収集されたデータを，各地方や国で測量やマッピングに使用される測地系へと変換します。


共分散を除く

観測の間の共分散を除くこと。これは精密な直交変換によって行われる，または水平と垂直を分けて計算することによって強制的に行う。


垂直線偏差

鉛直線(垂直)の上向き方向と，楕円体に対する垂線間の角度の差。


自由度

網の冗長度。


標高差

2点間の標高の差。


デルタ高度

Trimble Geomatics OfficeソフトウェアでのGPS基線の垂直成分。それは，高度差か高度の変化分です。


デルタN，デルタ E，デルタU

ローカル測地の水平座標系で表現された座標の差。


デルタX，デルタY，デルタZ

地心座標系で表現された座標の差。


ディファレンシャル測位

同じ衛星を同時に捕捉している2つの受信機の相対的な位置の正確な観測。


DOP

精度劣化(Dilution of Precision )

GPS位置の質の指標。それは，衛星群の各衛星の位置と他の衛星の相対関係，およびそれらのGPS受信機に対する幾何学配置を数値化したものです。DOP値が低いことはよい精度の確率が高いことを意味します。GPSアプリケーションに対する標準DOPは以下の通りです。

PDOP 位置(3つの座標)

HDOP 水平(2つの水平座標)

RDOP

VDOP 垂直(高度のみ)

TDOP 時刻(時計オフセットのみ)


ドップラーシフト

衛星と受信機の相対的な動きによって起きる信号周波数の明らかな変化。


2重差計算

同じ衛星を捕捉している2つの受信機によって同時に観測した搬送位相を計算する算術方法。この方法は，衛星と受信機の時計の誤差を除去します。


DTM

デジタル地形モデル( Digital Terrain Model )

地形の3次元デジタル表現。


2周波

GPS衛星からのL1とL2の両方を使用するタイプの受信機。2周波受信機は電離層遅延の補正を行うので，長い距離，またはより悪化した状況でも，より精確な位置を計算することができます。


地心座標( ECEF )

WGS-84の基準に使用される地心座標系。この座標系では，システムの中心は地球の重心です。z軸は地球の平均回転軸で，x軸は北緯0度，東経0度を通過します。y軸はx軸とz軸の平面と直角を成します。


東距

グリッドの東方向の読み方。グリッド上の左から右がプラスの方向です(X-軸)。


標高

平均海面上の高度，またはジオイド上の垂直距離。標高は海抜高とされることがあります。


仰角マスク

通常13度に設定されています。この角度以上で衛星を捕捉すると，建物，木，マルチパスエラーによる干渉を防ぐことができます。

Trimbleは，13度以下で衛星の捕捉をしないことをお勧めします。


楕円体

地球の数学的モデルで，短軸のまわりに楕円を回転させることにより形成されます。地球をモデル化する楕円体では，短軸は対極軸，長軸は赤道軸です。

楕円体は，両方の軸を指定するか，あるいは長軸と扁平度を指定することによって完全に定義することができます。

2つの数量が楕円体を定義します。それは通常以下のように与えられます。

長半径の長さ(a)

扁平度 [image] (bは短半径の長さです。)


楕円体距離

Trimble Geomatics Officeソフトウェアで使用される場合，楕円体上の2点間の距離。

注意:楕円体距離は測地線距離とは異なります。


楕円体高度

楕円体面からポイントまで，法線に沿って測定された距離。


エンティティ

主要なグラフィック要素。グラフィックウィンドウに表示し，選択することができます。

Trimble Geomatics Officeソフトウェアで使用できるエンティティは，ポイント，ライン，円弧，曲線，テキスト，注釈です。


軌道暦

時刻の関数として天球上の物体の位置を表すデータの組。各GPS衛星は制御部分によってアップロードされた近い将来の予測された位置を表した放送軌道暦を定期的に放送しています。後処理プログラムは過去の衛星の正確な位置を表す精密軌道暦を使用することができます。


エポック

GPS受信機の観測の間隔。エポックは測量タイプによって異なります：

リアルタイム測量では1秒に設定されています。

後処理測量では1秒から1分の間隔に設定できます。


エポック間隔

GPS受信機によって使用される観測の間隔。Cycle( サイクル )とも呼ばれます。


誤差

測った値と 真 の値との差。測量の誤差は次の3つに分けられます。不注意による誤り，系統誤差，そしてランダムな誤差です。最小自乗分析は誤りと系統誤差を見つけるために使用され，そして最小自乗平均がランダムな誤差を量り，散らばせるために使用されます。


誤差楕円

座標の誤差楕円は，網平均されたポイントの誤差の大きさと方向のグラフィックな表現。


イベント

写真測量のカメラのシャッターが閉じられた様な，イベントが発生した時の記録。GPS受信機はイベントの時刻とイベントについての英数字のコメントをキーパッドを通して入力したものを含むイベントを記録することができます。イベントはキーパッドまたは受信機の外部ポートの一つの電気的な信号入力によってトリガされます。


高速静止

20分以内の静止観測によりGPS生データを収集し，後処理を行ってセンチ単位の精度を得るGPS測量の方法。基本的に観測時間は，視界内にある衛星(SV )数によって変化します。

4衛星の場合20分*

5衛星の場合15分*

6衛星以上の場合8分*

(*15秒エポックで収集の場合)


特徴･属性ライブラリ(*.fcl )ファイル

特徴コード，属性，CADスタイル，コントロールコードの定義を含むテキストファイル。


特徴コード

目に見える特徴を表現する言葉や略語。


フィールドコード

Trimble Geomatics Officeソフトウェアに対してレポート，ファイル，注釈に情報を挿入するよう指示する専用の命令。

フィールドコードは，ASCIIインポート，エクスポート，レポート操作でデータベースデータの転送を取り扱うために使用されます。


最終解

後処理を行ってGPSベクトルを生成する時，特に静止解析では，基線解析プログラムは多様な処理技術やGPS観測の組み合わせを使用しての異なる解を経て段階を踏みながら進みます。一般的に，次に得られる解は前の解よりも優れています。最終解は2点間のGPSベクトルの最良の推定値を提供します。


固定される(Fixed )

固定される(Constrained )参照。


固定座標

網平均を行う時に動かさないポイントの座標。


フィックス解

基線解析プログラムが十分な信頼度で1組の整数値を選び出し整数アンビギュイティ(あいまいさ)サーチを解決できる場合に得られる解。フィックス解と呼ばれる理由は，アンビギュイティ(あいまいさ)が推定されるフロート値からその正しい整数値まですべて固定(Fix )されているからです。


扁平率
扁平度

楕円体の長軸と短軸の相対的な長さの数学的表現。


扁平率の逆数
扁平度の逆数

読み込みや編集がより簡単な扁平度の表現。


フロート解

基線解析プログラムが十分な信頼度で1組の整数値を選び出し整数アンビギュイティ(あいまいさ)サーチを解決できない場合に得られる解。フロート解と呼ばれる理由は，アンビギュイティ(あいまいさ)が断片的な部分を含み，整数でないからです


自由平均

どのポイント(座標)も固定されていない網平均を行うこと。網平均は内部的な固定(拘束)を使用します。


度数分布

データセットにおける残差の大きさと広がり。ヒストグラムでグラフィックに表示されます。


全点固定

網のすべてのポイントが大きなコントロール網の一部である網平均は，その公表されている座標値を固定して行われます。小さなコントロール網を大きなものに，または古い網を新しい網に同化させるために使用されます。


GDOP

幾何学的な精度劣化(Geometric Dilution of Precision )

ユーザの位置と時間における誤差と，衛星の距離における誤差の間の関係。DOP参照。


測地方位角

測地子午線と，観測者の測地線への接線との間の角度。観測者の楕円体法線に垂直な平面上で観測されます。北から時計回りです。


測地座標系

ジオイド（物理的な地表）の一部または全体に合わせて設計された数学的モデルで，楕円体と，座標系の原点として設定された地勢学的な地表面上の点との間の関係によって定義されます。

世界測地座標系は一般的に楕円体の大きさと形状，および地球の中心に対しての楕円体の中心の位置によって定義されます。

各々の地域に最も適したものとしてさまざまな座標系が確立されてきました。例えば，ヨーロッパの地図はしばしば1950年のヨーロッパ座標系（ED-50 ）に基づいています。アメリカ合衆国の地図はしばしば1927年または1983年の北アメリカ座標系（NAD-27，NAD-83 ）に基づいています。GPS 座標はすべてWGS-84座標系の地表に基づくものです。


地理的座標

緯度，経度，楕円体高です。


ジオイド

平均海面に非常に近い重力の等位面。均一的な数学的形状でなく，全体的には楕円体に近い不規則な形です。

一般的にポイントの標高はジオイドを基準に観測されます。しかしGPSを使用して固定されたポイントはWGS-84測地系上の高度を持っています(数学的数値)。

WGS-84測地系とジオイドの関係を表現できる単一の数学的定義は無く，観測によって決定する必要があります。ジオイド上の標高を観測するには従来の測量方法を使用しなければなりません。そしてその結果を同じポイントのWGS-84楕円体上の高度と比較します。

ジオイドとWGS-84測地系の間の差の観測をたくさん集めることにより，比高値のグリッドファイルを作成できます。これにより，中間地点のジオイド比高を補間することができます。こういったジオイド比高のグリッドファイルはジオイドモデルと呼ばれます。ジオイドモデルの範囲内のWGS-84の座標を与えると，モデルはこの位置の補間されたジオイド比高を返すことができます。


ジオイドモデル

特定の区域か地球全域に対するジオイドの数学的表現。ソフトウェアは網のポイントに対するジオイド比高を得るため，ジオイドモデルを使用します。


ジオイド観測

ジオイドモデルから得られた，誤差を伴うジオイド比高。Trimble Geomatics Officeソフトウェアの網平均は，誤差を伴うすべての観測と同様にそれを扱います。平均するに従い，観測は平均されたジオイド観測になります。


ジオイド比高

ある1点における楕円体とジオイドの間の距離。


Geomatics(ジオマティクス)

空間情報の設計，収集，保存，分析，表示，修正。空間情報の収集はGPSや一般測量機を含むいろいろなソースから得られます。Geomaticsは，従来の測量を新しい技術に統合します。従ってGeomaticsは非常に多くのアプリケーションの役に立ちます。


GPS

全地球測位システム(Global Positioning System )

GPSは，非常に高い高度で地球の周囲を軌道を描いて回っている24の衛星群を基礎にしています。


GPS基線

1組のステーション間の3次元の観測。同時にGPSデータを収集し，その差を計算します。

デルタX，デルタY，デルタZ，または方位角，距離，デルタ高度として示されます。


GPS観測

誤差を伴うGPS 基線。平均するに従い，観測は平均されたGPS観測になります。


GPS生データ

後処理を目的にGPS受信機によって収集されたデータ。.datファイル(Trimble生データファイルフォーマット)，またはRINEXファイルです。


GPS時刻

NAVSTAR GPSシステムで使用されている基準時刻。GPS時刻は協定世界時(UTC )を基準にしていますが，周期的な'うるう秒'を追加して地球の回転周期の変化に対応する補正を行うことはありません。


グリッド

地図投影の様な，2次元の水平面の長方形の座標システム。


グリッド変換

地理座標と地図投影座標間の変換。


グリッド距離

地図投影座標で表現された2点間の距離。


地表距離

2つの地表ポイント間の距離( 曲率が適用された水平距離 )。


HDOP

水平の精度劣化(Horizontal Dilution of Precision )


高度計測ロッド

外部GPSアンテナと一緒に提供される計測道具で，あるポイント上のアンテナの高さを計測するために使用されます。


HI

器械高( Height of instrument )

GPSの場合，アンテナ高と同義です。


ヒストグラム

網平均における残差の大きさと分布をグラフで表示。


水平基準点

水平座標のみ精度のあるポイント。標高や楕円体高度は精度が低いか未知です。


水平距離

それぞれのポイントの標高から水平的に算出された，2点間の距離。


水平位置

水平座標のみを持つポイント。


独立した

幾何学的または誤差に接続されていないサブ網，観測，基準点。反対は相関(correlated )。


内部拘束

ポイントの座標を1つも固定することなく計算される網平均。Trimble Geomatics Officeソフトウェアは内部拘束として網の重心を使用します。


整数アンビギュイティ(あいまいさ)
整数値アンビギュイティ( あいまいさ )

GPS衛星とGPS受信機の間の搬送波位相の擬似距離に存在するサイクルの整数部。


整数値サーチ

リアルタイムでも後処理でも，GPS基線解析は最適な結果を得るため固定された整数解を必要とします。基線を求めるために使用されるGPS観測の処理ソフトウェアは，固定された整数解を得るために整数値サーチを行います。サーチには，整数値の多様な組み合わせを試したり，最適な結果を選択することも含まれます。


電離層フリー

電離層フリー解(ionospheric freesolution (IonoFree ))

GPS観測とモデルを組み合わせ，GPS信号への電離層の影響を除去した解。この解は高精度の基準点測量で特に長基線を観測する場合に使用されます。


電離層

地球の表面から80-120マイル上空にある荷電粒子の帯域。1周波受信機を使用して長基線を観測する場合，GPS観測の精度に影響を与えます。


電離層モデル化

電離層によって発生する時間遅延はGPS信号の周波数に応じて変化し，L1信号，L2信号の両方に別々に影響を与えます。2周波受信機が使用される場合，両方の周波数の搬送波位相の観測を使用して電離層の影響のほとんどをモデル化し消去します。2周波観測が行えない場合には，GPS 衛星によって放送された電離層モデルを使用して電離層の影響を削減することができます。しかし，放送モデルの使用は2周波観測ほど効果的ではありません。


反復

観測方程式，正規方程式，座標の平均，残差の計算の形成を含む平均計算の完全なセット。


キネマティック測量

最低4衛星の捕捉を保ちながら，ストップ・アンド・ゴー観測を行うGPS測量方法。リアルタイム，または後処理によりセンチメートル精度を得られます。


既知点初期設定

既知点はキネマティックの初期設定と組み合わせて使用されます。2つの既知点が使用可能な場合，基線解析プログラムは2点間を逆算し，初期化ベクトルを求めることができます。既知の基線成分を持つこの初期化ベクトルは整数アンビギュイティの解析を簡単にします。解析プログラムがこのアンビギュイティを正しく解析できるとフィックス解が可能であり，キネマティック測量の最適な解をもたらします。


L1

衛星のデータを放送するためにGPS衛星によって使用される第1のLバンド周波数。その周波数は1575.42Mhzです。これはC/Aコード，Pコード，航法メッセージによって変調されています。


L2

衛星のデータを放送するためにGPS衛星によって使用される2番目のLバンド周波数。その周波数は1227.6Mhzです。これはPコード，航法メッセージによって変調されています。


ラベル

プロジェクトのポイントに割り当てることができる情報。ポイントの脇に表示されるため，その位置を簡単に見つけることができます。ラベルは測量表示でも平面図表示でも表示できます。

Trimble Geomatics Officeソフトウェアのあらかじめ定義されているラベル定義を使用してポイントにラベルを付けることができます(例：名前，特徴コード，標高)

ラベルは，Microsoft Windowsの画面設定のヒントと同じフォントとサイズを使用します。

データベースのポイントにラベルを割り当てるには，表示/ポイントラベルを使用します。


レイヤー

グループ分けされたデータを一緒に保管する場所。

この方法でレイヤーにデータを整理することは，その管理を簡単にします。1つのプロジェクトにレイヤーをいくつでも持つことができます。レイヤーにエンティティを割り当てたり，割り当て直したりするには，プロパティウィンドウを使用します。レイヤー名はアルファベット100文字まで可能です。


最小自乗法

確率論を基づく，観測の平均のための数学的手法。この平均法では，平均済み残差すべての自乗の和を最小にします。


信頼度

結果に対する信頼の度合。パーセントかシグマで表されます。


有意性

確率の表現。1シグマ( 標準 )誤差は，68パーセントの有意性を持つと言われています。1次元の誤差に対しては，95パーセントの有意性は1.96シグマと表現されます。99パーセントの有意性は2.576シグマと表現されます。


ローカル楕円体

座標系によって特定される楕円体。WGS-84座標は最初この楕円体に変換され，その後，グリッド座標に変換されます。


ローカル測地座標

ポイントの経度，緯度，高度です。座標はローカル楕円体に基づいて表現されます。


ローカル測地水平面

与えられた点の楕円体高における楕円体に接する平面。ローカル測地水平面上の座標の値はNorth(北)，East(東)そしてUP(上)で表されます。LGHは楕円体上のベクトルのモデル化の前に，ECEFの差の回転のために使用されます。LGHの要素から計算された方位角は楕円体のモデルの一部として補正しなければなりません。


環閉合

環閉合は網内の1組の観測に存在する誤差の量に関する指標です。

環閉合は，1つ以上の観測が行われたポイントを選択し，そういった観測の1つをポイントの座標に追加し，その観測を基に第2のポイントの座標を計算することによって計算されます。1つの環につき1回以上この過程が繰り返され，最後には開始ポイントで終了します。その観測に誤差が無い場合には，最終的に計算された座標は当初の開始した座標と全く同一のはずです。計算された座標を当初の座標から差し引くことで閉合差が確定されます。この誤差をラインの長さで割ると，誤差をp.p.m.で表現できます。

この技術は，2つの異なるポイントが高精度で既知の場合，両方のポイント間で使用することもできます。これはトラバース閉合としても知られます。


長軸

楕円体参照。


Mapping Angle(マッピングアングル)

地図投影の北とある点の経度の子午線の角度。真北方向角としても知られます。


地図投影

楕円体の曲面を直角座標に変換するために使用される厳密な数学的表現。


平均海面高

潮汐のすべての段階にわたる海面の平均高度。標高の基準として使用されます。


最小固定

座標系を定義するのに必要な固定のみ行った網平均。観測に内部的なばらつきがないか確認するために使用されます。


短軸

楕円体参照。


モデル化

楕円体の様に，ある定義された座標系上で観測と関係する誤差を数学的，幾何学的に表現。


マルチパス

GPS信号が異なる2つ以上の経路を通ってアンテナに到着する時に起きる干渉( テレビ画面の 'ゴースト' に似ています )。 長い方の経路を通る信号により，より長い擬似距離を推定するため誤差を増加させます。マルチパスは，アンテナの近くの建物からの反射によって発生することもあります。


narrow-lane(ナローレーン)

L1とL2の搬送波位相の観測の線形結合(L1+L2)で，収集した基線データの電離層の影響を除くために使用します。ナローレーンの実効波長は10.7cmです。


NAVDATA

各衛星より放送される1500ビットの航法メッセージ。このメッセージには，システム時間，時計の補正パラメータ，電離層による遅延モデルパラメータ，および衛星の軌道暦と健康状態が含まれます。それらの情報はユーザの位置と速度を取得する際に，GPS 信号を処理するために使われます。


網

基線の組。サブ網 も参照。


網平均

重みをつけた観測残差の自乗の和を最小にすることで測量網の不整合を解くように設計された連立方程式の解法。

Trimble Geomatics Officeソフトウェアが使用する平均技術は，間接観測法とも呼ばれます。


網ステータス

特定の観測が平均に含まれるかどうかの指標。

網とは，それが平均に含まれることを意味します。

網なしとは，それが平均から除外されることを意味します。


NMEA

全国海洋電子機器協会(National Marine Electronics Association )

NMEA 0183 Standard は，海洋電子航法装置のためのインターフェースを定義します。この標準はNMEA 文字列として参照される多くの'文字列'を定義し，位置のような詳細な航法データを含んでいます。

TrimbleのほとんどのGPS受信機は位置をNMEA 文字列として出力できます。


法線

測地学において，楕円体の面に垂直な直線。


正規分布曲線

確率論に従った期待値の近傍のランダム変数の理論的な分布を図で表示したもの。ヒストグラムと共に使用されます。


測地方位角

観測者の測地子午線から楕円体上の観測点までの計測された角度


北距

グリッドの北方向の読み方。


観測残差

平均によって決定されるような，観測に適用される補正。


観測

測量観測参照。


静止観測時間

うまくGPS解析を行うためにステーションかポイント上で必要とされる時間。測量技術，使用されるGPS受信機のタイプ，最終結果に要求される精度などによって時間の長さは左右されます。静止観測時間は，数秒(キネマティック測量)から数時間(最高レベルの精度と再現性が必要とされる基準点測量や地すべり測量)と多岐に渡ります。


原点

座標系の軸の交点。開始のポイントです。


海抜高

ポイントとジオイド面の間の距離。通常は標高と呼ばれます。


OTF検索法

リアルタイムでも後処理でも，GPS基線解析は最適な結果を得るため固定された整数解を必要とします。(整数値サーチ参照)

以前は，2つ以上の受信機がそれぞれのポイントに静止している間に収集された測定値を使用してサーチされました。近代の受信機やソフトウェアでは，移動局受信機が移動している間に収集された測定値を使用することができます。受信機が移動しているために，データは'On-the fly(オンザフライ)'(OTF )と呼ばれ，このデータを使用する整数値サーチは'OTFサーチ'と呼ばれます。


範囲外，異常値

推定された誤差に対して残差が非常に大きい時に統計的な解析によって示された観測。この言葉はヒストグラムのグラフ表示からきている。


重複決定

網の座標の計算に必要な観測よりも多い観測のある網。冗長度と関係があります。


Pコ－ド
Pコード

GPS衛星によって送信された精密な('precise')コード。各衛星はL1，L2両方の搬送波位相に変調された独自のコードを持っています。アンチスプーフィングが有効な時にはPコードはYコードに置き換わります。


パラメ－タ
パラメータ

面上やライン上のポイントの与えられた座標を変換する独立した変数。未知 参照。


パリティ

2進デジタルデータの保存と通信に使用されるエラー検査の方式。パリティチェックのオプションには奇数，偶数，なしがあります。


PDOP

位置の精度劣化(Position Dilution of Precision )

単位を持たない数値で，ユーザの位置の誤差と衛星の位置の誤差との関係を表わします。幾何学的には，PDOPは，1 を受信機から4つの観測される衛星に向かって走行する線によって形成されるピラミッドの容量で割ったものに比例します。位置設定が「良い」と見なされる数値とは，例えば3と言うふうに小さく，7より大きな数値は良くないと見なされます。このように，小さいPDOPは広く拡散した衛星に対応づけらます。

PDOPはHDOP(水平の精度劣化)とVDOP(垂直の精度劣化)と以下の関係があります。


PDOPカットオフ

受信機が位置の計算を行なう最大の高PDOP値。衛星の幾何学的な位置がPDOPを設定されたマスクより大きい場合，受信機は測位を停止します。


PDOPマスク

受信機が位置の計算を行なう最大の高PDOP値。


位相中心

アンテナ位相補正参照。


位相中心モデル

特定のアンテナタイプを基準にしたGPS信号への補正を適用するのに使用されるモデル。補正は，水平線上の衛星の仰角を基づき，アンテナ位相中心位置の電気的変位をモデル化します。こういったモデルは，基準局と移動局の両方で同一のアンテナが使用されていない場合に発生する誤差を消去するのに有益です。アンテナ位相補正も参照。


鉛直にする

地球の重力フィールドの等位面に垂直な垂直線(鉛直線)に沿ってアンテナや機器を設置すること。


1点測位

単独測位 参照。


後処理

収集された後にコンピュータで衛星データを処理すること。


PPM

Parts per million

距離測定における縮尺誤差の標準化された表現。1PPMの誤差は，1000メートルの距離を進む度に1ミリの測定誤差が発生することを意味します。


精密軌道暦

軌道暦 を参照。


精密度

任意の変数が算計算出された値にどれだけ近く分布するか度合い。精密度が高いことは，残差が小さいことを暗示します。通常，何分の1，またはPPMとして表現されます。


PRN

擬似ランダム雑音(Pseudorandom noise )

雑音のようにランダムに点在するように見えるデジタルの1と0の連続ですが，完全に複製することができます。PRN コードは完全に偶然な場合を除き，すべての遅延やラグに対する非常に低い自動相関値を持っています。

各NAVSTAR 衛星は，それぞれ独自のC/A およびP 疑似ランダム雑音コードを送信しています。そのために'PRN'という言葉はGPS衛星の別名として使用されることがあります。


確率

統計的割合。定義された範囲内に落ち着くであろう観測の仮定的数値の部分を表わします。有意性と呼ばれることもあります。


推定値

観測や他の量に対する平均された値。平均が正しく行われたことを仮定しています。可能な限り真の値に近い近似値です。


プロジェクト

Trimble Geomatics Officeソフトウェアはプロジェクト内のデータを使用して作動します。プロジェクトを現在働いている職場と考えることができます。新しいプロジェクトは常に既存のテンプレートから作成され，テンプレートのすべての要素をコピーします。この時点から，新しい仕事はすべて新しいプロジェクトにのみ保存されます。

プロジェクトには，生の観測，計算されたポイント，座標系定義，ライン等，テキスト，CADスタイルのすべてが含まれます。


プロジェクト測地系

Trimble Geomatics Officeソフトウェア内のプロジェクトに割り当てられた測地系。ローカル座標はすべてプロジェクト測地系を使用して表示されます。


投影

投影は平面の地図を作るために使用され，地球の面やその一部を表します。


伝搬誤差

推定された観測誤差から得られた計算された誤差。伝播された座標の誤差は，例えば，点間の方位角，距離，そして高低差の相対的な誤差に伝播するということです。


品質合格検査

定義された1組の許容値にデータが合格するかどうかを決定するため，生のGPS測定データに実施される1つ以上のソフトウェア評価検査。これらは，以降の解析からデータを除外したり質の向上が必要なデータに印をつけたりします。


QCレコ－ド
QCレコード

品質コントロールレコード(Quality Control records )

QCレコードは，測定されたGPS座標の質に関する情報を含んでいます。それはポイントレコードと共に保存されます。


レシオ

初期設定中に，受信機は各衛星の波長の整数値を決定します。特定の整数値セットに対して，それが正しいセットかどうかの確率を求めます。

レシオとは，現在の最適な整数値セットの正確さの確率を，第2に適したセットの正確さの確率に比較した割合です。そのために，高いレシオは，最適な整数値セットがその他のどのセットよりもずっと優れていることを示します。これはそれが正しいことを裏付けます。新点初期化やOTF初期化において，レシオは5以上でなければなりません。


RDOP

相対的な精度劣化(Relative Dilution of Precision )


リアルタイムキネマティック

最低4衛星の補足を保ちながら，リアルタイムに短い(ストップ・アンド・ゴー)観測を使用するGPS測量の手法。この方法には，基準局受信機と移動局受信機の間に無線データリンクが必要です。


直角座標

基準の軸が直角に交わる，すべてのシステムの座標です。


縮約列ﾌﾟﾛﾌｧｲﾙ

方程式が並べ替えられる正規方程式を簡略化したバージョン。0以外の要素を記録するのに必要なコンピュータのメモリを最小にします。


冗長度

基準網が重複決定される場合，またはその一部を厳密に計算するために最低限必要な観測以上の観測がある場合のその量。


冗長度数

基準網の一部( 全体ではない )の自由度数。


冗長基線

他の観測によって網に既に連結されているポイントに対して観測された基線。冗長基線は，過去の観測の独立した再観測，または別の基準局からポイントへの観測です。独特なポイントを決定するのに必要な情報以上の情報を提供することから冗長と呼ばれます。しかし，冗長観測は過去の観測の質のチェックするので大変，有益です。


冗長観測

繰り返された観測，または網を 重複決定 するのに貢献する観測。


リファレンスファクタ

単位重量の標準誤差参照。


基準フレーム

測地の座標系。


基準局

これは基地局です。


リファレンスバリアンス，基準分散

reference factor(リファレンスファクタ)の自乗。


相対誤差

網平均された基準点の組みを，またはその間を表現した誤差と精密度。


残差

基準網において総合的に閉合するための観測の補正，および平均。また，観測された量とその量に対する計算された値の間の差です。


RINEX

受信機に依存しない交換フォーマット(Receiver INdependent EXchange format )

複数の受信機製造会社からファイルを交換するため使用されるGPS生データの標準ファイルフォーマット。


RMS

自乗平均の平方根(Root Mean Square )

RMSはポイント観測の正確さを表わします。それはフィックスした座標の約70％が見つかる誤差円の半径です。距離か波長サイクルの単位で表現されます。


回転子午線

Oblique Mercator(オブリークメルカトール)地図投影のゾーン定数。


回転

座標変換において，座標系の原点のまわりを座標軸が動く角度。


移動局

フィールドでデータを収集する移動するGPS受信機，およびフィールドコンピュータ。移動する受信機の位置は，静止した基準局GPS受信機に対して相対的にディファレンシャル補正されます。


RTCM

海上無線技術委員会(Radio Technical Commission for Maritime Services )

移動するGPS受信機のリアルタイムディファレンシャル補正のディファレンシャルデータリンクを定義するため設立された委員会。RTCMディファレンシャル補正メッセージには2種類ありますが，TrimbleのすべてのGPS受信機は，新しいタイプ2のRTCMプロトコルを使用します。


RTK

リアルタイムキネマティック(Real-time kinematic )

GPS測量の一種。


衛星の幾何学的配置

GPS測量中のGPS衛星の位置と動き。


スケール

最小自乗法で，要求される信頼度に基づく変数(誤差)に適用される値。


スケール重量

観測の正しい加重を得るために推定された誤差にスケールを適用する過程。Trimble Geomatics Officeソフトウェアの網平均には3種類のスケールがあります：

標準スケールが1.00に設定され，初めに推定される誤差は同じであることを意味します

自動更新前回の平均のリファレンスファクタがスケールに設定されることを意味します

ユーザ定義自分でスケールの値を入力することを意味します

スケールは下の方法の1つを使用して観測誤差に適用されます。

全観測

各観測

リファレンスバリアンスグループ


縮尺

地図投影や変換のような，座標や他の1次変数に使用される乗数。


SDMS

測量データ管理システム(Survey Data Management System )

測量データの収録に関する1組のフォーマット定義。AASHTOがこのシステムを維持します。


セレクティブアベイラビリティ(S/A )

米国国防省によるGPS衛星信号の人為的な劣化。セレクティブアベイラビリティによって発生する位置誤差は100メートルにも及びます。


長半径

長軸の半分。


短半径

短軸の半分。


セッション

1つ以上のGPS受信機が衛星の観測データを記録する間隔。


設置誤差

基準点における整準台の中心誤差，または器械高誤差。


サイドショット

冗長度のない観測された基線。


シグマ

標準誤差のための数学記号，または用語。


1周波

L1 GPS信号のみを使用する受信機のタイプ。電離層の影響に対する補正はありません。


サイトキャリブレーション

GPS観測によって決定されたWGS-84位置(緯度と経度，楕円体高度)と，地図投影と平均海面高上の標高によって定義されたローカルの既知座標間の関係を構成するパラメータを計算する過程。RTK 測量を使用している場合，パラメータは現場でWGS-84からローカルグリッド座標(およびその逆)をリアルタイムに作成するために使用されます。


スカイプロット

グラフ表示するよう選択された時間に見ることができる衛星の通り道を示す極のプロット。衛星の仰角は半径の大きさで表わされ，方位は角度の大きさで表わされます。結果は，観測者が測量ポイントの真上から見下ろしている衛星の通り道で表わされます。


解のタイプ

GPS観測から基線解を得るために使用されるデータと技術，両方の表現。典型的な解タイプには，コード，フロート，フィックスといった表現が含まれます。これは基線解を得るために基線解析プログラムによって使用された技術を説明します。解タイプにはまたL1，L2，ワイドレーン，ナローレーン，電離層フリーのような表現を含むかもしれません。これは特定の結果を得るためにGPS観測が組み合わされた方法を説明します。詳細についてはGPS解析の参考文献を参照してください。こういった用語や技術に関するより詳しい考察があります。


斜距離

ポイント間の高度差に平行な平面上(斜面)の距離。


SNR

信号対雑音比( Signal-to-Noise Ratio )

衛星信号の強度の基準。SNRは0( 信号なし )から約35までの範囲です。


標準誤差

誤差の統計的な推定。観測の無限数の68%がこの値と同じかそれ以下の絶対誤差を示します。


単位重量の標準誤差

平均された網の観測の残差の大きさと平均前の( a priori ) 推定された観測誤差の比較。


平面座標

米国の法令により採用された横メルカトルとランベルト地図投影の特別な定義。こういったゾーンのセットはNAD-27とNAD-83にあります。


静止( 測量 )

GPS測量の手法。GPSの生データを収集するために長い観測を行ない，後処理を行ってセンチメートル単位の精度を得ます。


静止網

静止網は，静止および高速静止技術を使用して収集されたGPS 基線で構成され，解析された幾何学と順序の表現。基線解析プログラムは最初に最高の質を持つポイントについてプロジェクトを試験し，その後，それらポイントから解析する網を構築します。その結果は，初めの精確な座標を使用して求められた1組の静止基線です。


ステータス

ポイントに対するすべての観測やキー入力された座標にはステータスフィールドがあります(プロパティウィンドウの概要ページにあります)。

ステータスには使用可能，チェックとして使用，使用不可があります：

使用可能な観測と座標は，ポイントの座標を計算して決定する再計算で常に使用されます。

チェックとして使用の観測と座標は，使用可能なものがない場合にのみ使用されます。

使用不可な観測と座標は，決して使用されません。


推計学モデル

網平均での誤差を推定するために使用される技術の一般的基準。


サブ網

共通基準点によって一緒に連結され，その他の基線から独立した(離れた)基線のセット。Trimble Geomatics Officeソフトウェアによって使用されるように，1つの網は1つ以上のサブ網から構成されたり，1つのサブ網は最低1基線と2つの基準点から構成されます。


Super-trak(ス－パ－トラック )
Super-trak(スーパートラック)

Trimbleの登録商標。Pコードが暗号化されている時にL2信号を処理する方法。


測量観測

GPS受信機や一般測量機を使用して基準点において，またはその間に対して行う観測。


SV

Satellite Vehicle(サテライト・ビークル)またはSpace Vehicle(スペース・ビークル)


記号とラインタイプ

記号とラインタイプはTrimble 記号エディタ，およびラインタイプエディタユーティリティを使用してメンテナンスされます。このエディタを使用して，既存の記号やラインタイプを編集したり，新しいものを作成したりできます。記号は記号ライブラリに保管され，ラインタイプはラインタイプライブラリに保管されます。

Trimble Geomatics Officeソフトウェアは現行のシステムの記号･ラインタイプライブラリを使用します。編集したライブラリを保存する時，これをシステムライブラリにすることができます(それが現行のシステムライブラリとされていない場合には)。


系統的誤差

関連する観測の多くで同じ符号，そしてある時は同じ大きさで発生する誤差。


τ( タウ )( 値 )

観測数，自由度，与えられた信頼度(95％)を基にした内部的な度数分布から計算した値。この値は，平均において観測が他の観測と一致しないかを決定するために使用されます。観測残差がタウを上回る場合，異常値としてフラグがつけられます。標準化された残差のヒストグラムのタウラインとして知られ，中央の縦線の左右にある縦線です。


τ( タウ )検定

Allen Pope による観測の異常値を見つけるための統計的手法。詳細についてはPope(1976 )をご覧ください。


TDOP

時間の精度劣化(Time Dilution of Precision )


一般測量機の観測

一般測量機の観測とは，レーザ測距儀や従来の測量機を使用したフィールドでの観測。


TWO

Time of Week ( 週の時刻 )

TOW( 週の時刻 ) はGPS時刻の土曜日の深夜 / 日曜日の朝からの秒。


トラッキング，捕捉

衛星からの信号の受信と認識の過程。


変換

1つの座標系から別の座標系へと変更するための網の回転，シフト，縮尺。


変換グループ

観測のあるグループに特有な変換パラメータを計算するために使用される選択された観測グループ。通常，グループ内の観測は類似の誤差のある同じ種類の，同じ方法で測定された観測です。


変換パラメータ

網平均から導いた，またはユーザが定義したパラメータのセット。1つの測地系を別の測地系に変換します。GPSの場合は一般に，WGS-84をローカル測地系に変換するパラメータを作成します。


整準台

中心を合わせる装置。GPSアンテナやその他の測量機を測量三脚に取り付けるのに使用されます。


整準台中心誤差

観測するポイント上に整準台の中心を合わせる( 鉛直にする )際の誤差。この誤差は推定されます。推定は測量方法の質の実測に基づき，なるべく少なくしてください。


対流圏補正

対流圏補正(tropospheric correction )

対流圏遅延を補正するために衛星の観測に適用される補正。


対流圏モデル

対流圏モデル(tropospheric model )

GPS信号は対流圏によって遅延されます。遅延の程度は，温度，湿度，気圧，ステーションの標高，水平線上にあるGPS衛星の仰角に左右されます。コードと位相の観測への補正は，対流圏モデルを使用してこれらの遅れを計算して行われます。


1変量

数学的機能。下の1次元の任意の誤差の傾向を表わします：

角

距離

高度差

標高

楕円体高


URA

ユーザ距離精度( User Range Accuracy )

特定の衛星( SV )が使用された場合に衛星の問題やセレクティブアベイラビリティ( S/A )によってもたらされる誤差の基準。32メートルのURAは，S/Aが有効になっていることを示します。URAの値はコントロールセグメントによって設定され，衛星によって放送されます。


未知量

座標と変換パラメータに対して計算された平均値。観測残差を計算するためにも使用されます。


US National

米国政府機関。米国とその統治領内において，国家測地系とすべての測地測量基準網を維持します。


US測量フィ－ト
US測量フィート

1200 /3937メートル。NAD-27における線形測定の公式単位です。


UTC

協定世界時( Universal Time Coordinated )

グリニッジ子午線における太陽平均時を基礎にした標準時。GPS時刻 も参照にしてください。


分散

標準誤差の自乗。


分散成分の推定

網の異なる部分の相対誤差を推定するための最小自乗法。


分散グル－プ
分散グループ

観測の1つのグループ。このグループの分散成分推定が網平均で使用されます。


分散･共分散行列

観測値のグループの分散と共分散を表わす数値の組。


VDOP

垂直の精度劣化(Vertical Dilution of Precision )


ベクトル

2つのポイント間の3次元のライン。


垂直

楕円体ではなくジオイドへの正接平面から計算されたことを除いて，法線と同じ。


高度平均

垂直観測と座標についてのみ行われる網平均。


水準点

標高座標の精度のみを持つポイント。水平座標は精度が低いか未知です。


WAVE

Weighted Ambiguity Vector Estimator

WAVEはTrimbleの基線解析プログラムです。静止，高速静止，キネマティックのデータ収集手順で行われたフィールド観測からGPSベクトルを計算します。


重量

観測値の分散の逆数。


重量戦略

Trimble Geomatics Officeソフトウェアの分散･共分散行列を補強するために使用する値の集合。


重量セット

重量の組，または相関関係にある観測の分散･共分散行列の逆行列。


WGS-84

World Geodetic System ( 1984 ) ( 世界測地システム1984 )

1987年1月よりGPSによって使用されている数学的楕円体。


ワイドレーン

L1とL2の搬送波位相観測の線形結合( L1 � L2 )。その波長(83.2cm)が役に立ちます。ワイドレーンは長い基線の整数値バイアスを探すのに役に立ちます。


X，Y，Z

地心座標系において，，Xはシステム開始点からグリニッジ子午線に伸びる座標軸の方向を意味し，Yは開始点から東経90ｰの子午線を通って伸びる軸を意味し，Zは極の方向を意味します。直角座標系ではXは東西軸を，Yは南北軸を，Zは高度軸を意味します。( ただし日本では，Xは南北軸，Yは東北軸を表わします。 )


Yコ－ド
Yコード

Yコードは，Pコードに含まれる情報を暗号化したもの。衛星はアンチ・スプーフィングが行われている時にPコードに代わってYコードを送信します。


天頂遅延

天頂近くの衛星から直接観測されたGPS信号の遅延。これは対流圏によって生じます。衛星が水平線に近づくと，対流圏を通る信号の通り道は長くなり，遅延が増加します。


GPS精密軌道暦ﾌｧｲﾙ

精密軌道暦ﾌｧｲﾙには､特定された期間（典型的には一日）の各ｻﾃﾗｲﾄの精確なﾎﾟｼﾞｼｮﾝﾃﾞｰﾀや時計補正が含まれます。この情報は､放送軌道暦ｴﾗｰの影響を減らすことによって基線の精度を改良するために､基線ﾌﾟﾛｾｯｻによって使用されます。精密軌道暦の使用は､長い基線の固定解を得るために基線ﾌﾟﾛｾｯｻの手助けをします。

Trimble Geomatics Office は､２つのﾌｧｲﾙﾌｫｰﾏｯﾄで精密軌道暦の使用をｻﾎﾟｰﾄします。

.sp3 −米国地質調査局によって定義されたASCIIﾌｫｰﾏｯﾄです。最も広範囲に有効なﾌｫｰﾏｯﾄです。

.ef18 −.sp3ﾌｧｲﾙに含まれるものと同様な情報を持つﾊﾞｲﾅﾘﾌｧｲﾙです。.ef18ﾌｧｲﾙは､より少ないﾃﾞｨｽｸｽﾍﾟｰｽを必要とし､より効果的に基線ﾌﾟﾛｾｯｻによって使用されることができます。

精密軌道暦の使用は､有効なGPS基線解析ｽﾀｲﾙﾀﾞｲｱﾛｸﾞの軌道暦ｵﾌﾟｼｮﾝによって制御されます。精密軌道暦ﾌｧｲﾙは､使用されようとするそれぞれのﾌﾟﾛｼﾞｪｸﾄにｲﾝﾎﾟｰﾄされなければなりません。ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを使用して､ﾌﾟﾛｼﾞｪｸﾄに１つ以上の精密軌道暦を読み込みます。

元来､精密軌道暦ﾌｧｲﾙは一週間のｻﾃﾗｲﾄのﾎﾟｼﾞｼｮﾝと時計のｵﾌｾｯﾄを提供しました。しかし､現在のﾌｧｲﾙはこの情報を一日分づつ提供します。これは､ﾌｧｲﾙが短時間で利用できるようになることを意味します。

ﾃﾞｰﾀの開始前と後の両方で最低8つのSVｴﾎﾟｯｸで解析されるGPS計測の期間を､精密軌道暦の期間が超過しなればならないことを､基線ﾌﾟﾛｾｯｻは要求します。この追加される精密軌道暦情報は､測量の開始と終了の両方で正しい補間を確実とするために要求されます。

精密軌道暦ｲﾝﾎﾟｰﾄﾕｰﾃｨﾘﾃｨは以下を行います。

ﾌｧｲﾙのﾌｫｰﾏｯﾄを調べます。ﾌｧｲﾙが.sp3ﾌｫｰﾏｯﾄの場合には､ｲﾝﾎﾟｰﾄ中に自動的に.ef18ﾌｫｰﾏｯﾄに変換します。ﾌｧｲﾙが.ef18ﾌｫｰﾏｯﾄの場合には､直接使用されます。

  ﾌﾟﾛｼﾞｪｸﾄに既に読み込まれた精密軌道暦ﾌｧｲﾙが存在するかを限定します。存在する場合､新しいﾌｧｲﾙが存在する有効範囲と同じ時間帯に及ぶかどうかを限定するために､そういったﾌｧｲﾙの有効範囲を検査します。その場合､新しいﾌｧｲﾙは古いﾌｧｲﾙを上書きし､それガ起きたことを知らせるためにｲﾝﾎﾟｰﾄﾚﾎﾟｰﾄに警告ﾒｯｾｰｼﾞを提示します。

  ﾌﾟﾛｼﾞｪｸﾄの精密軌道暦ﾌｫﾙﾀﾞにﾌｧｲﾙをｺﾋﾟｰします。

精密軌道暦ﾌｧｲﾙは下記のようなさまざまな情報源から利用できます。

  米国地質調査局

  欧州軌道決定ｾﾝﾀｰ(CODE)

  欧州宇宙機関

  ｽｸﾘｯﾌﾟｽ軌道･永続配列ｾﾝﾀｰ (SOPAC)

  ｶﾅﾀﾞ､ｴﾈﾙｷﾞｰ･鉱山･資源省 (EMR)

  NASAジェット推進研究所 (JPL)


ご使用のｺﾝﾋﾟｭｰﾀｰで精密軌道暦ﾌｧｲﾙのｲﾝﾎﾟｰﾄを行うには（.sp3､.e18）

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。

ｲﾝﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが表示されます。

2.	測量ﾀﾌﾞで､精密軌道暦ﾌｧｲﾙ（*.sp3､*.e18）ｵﾌﾟｼｮﾝを選択します。

3.	OKをｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが表示されます。

4.	ｲﾝﾎﾟｰﾄしたい.sp3か.e18ﾌｧｲﾙを見つけます。

5.	開くをｸﾘｯｸします。

ﾌｧｲﾙはﾌﾟﾛｼﾞｪｸﾄの精密軌道暦ﾌｫﾙﾀﾞに読み込まれます。

注: ｲﾝﾎﾟｰﾄされる精密軌道暦ﾌｧｲﾙが､ﾌﾟﾛｼﾞｪｸﾄ内に既に存在する精密軌道暦ﾌｧｲﾙと同じ期間に及ぶ場合には､ﾒｯｾｰｼﾞが表示されます。このﾒｯｾｰｼﾞは､ｲﾝﾎﾟｰﾄ中に1つ以上のﾒｯｾｰｼﾞが生成されたことを示します。こういったﾌｧｲﾙの詳細を見るには､このﾒｯｾｰｼﾞの｢はい｣をｸﾘｯｸします。

注: 精密軌道暦の使用は､有効なGPS基線解析ｽﾀｲﾙの軌道暦ｵﾌﾟｼｮﾝによって制御されます。


登録概要

Trimble Geomatics Office を登録しご連絡先をご提供いただくことによって､ﾄﾘﾝﾌﾞﾙ社はｿﾌﾄｳｪｱに関するあらゆる新しい情報をそれが配布可能になり次第お送りすることができます。これには､製品の新開発に関する情報も含まれます。ご登録によって､ﾄﾘﾝﾌﾞﾙ社は製品ｻﾎﾟｰﾄと開発を継続的に改良していくことができます。

Trimble Geomatics Office の登録は､ｲﾝｽﾄｰﾙ過程の最後にか､Trimble Geomatics Officeｿﾌﾄｳｪｱ内からいつでも行うことができます。

それには以下を行います。

1.	Trimble Geomatics Office で､ﾍﾙﾌﾟ/登録を選択します。

2.	登録方法を選択します。以下の1つを行います。

ｲﾝﾀｰﾈｯﾄで提供されている登録ﾌｫｰﾑに記入して提出します。

提供されたﾃｷｽﾄの登録用紙を印刷して､記入してから､それをﾌｧｯｸｽか郵送します。

ｲﾝﾀｰﾈｯﾄ上とﾌｧｯｸｽ･郵送用のﾌｫｰﾑの質問は同じです。

ご提供いただく情報は､ﾄﾘﾝﾌﾞﾙ社外で使用されたり配布されたりすることはありません。ご登録用紙には､Trimble Geomatics Office の使用方法と理由に関する質問を含んでいただくことができます。ﾄﾘﾝﾌﾞﾙ社はこういった質問に答える義務はありませんが､答えを基に製品ｻﾎﾟｰﾄと開発を改良していくことができます。


登録　－　ｲﾝﾀｰﾈｯﾄ経由ｺﾏﾝﾄﾞ

概要と詳細

ｲﾝﾀｰﾈｯﾄ経由でTrimble Geomatics Officeｿﾌﾄｳｪｱをご登録いただくには下記を行います。

1.	ﾍﾙﾌﾟ/登録/ｲﾝﾀｰﾈｯﾄ経由を選択します。ご利用のｳｪﾌﾞﾌﾞﾗｳｻﾞｰにｵﾝﾗｲﾝ登録ﾍﾟｰｼﾞが表示されます。

2.	該当事項を記入します。*印の付けられた全ﾌｨｰﾙﾄﾞに記入が必須です。

3.	登録事項を送付 をｸﾘｯｸします。


登録　－　ﾌｧｯｸｽか郵送
登録　−　ﾌｧｯｸｽか郵送

概要と詳細

ﾌｧｯｸｽか郵送でTrimble Geomatics Officeｿﾌﾄｳｪｱをご登録いただくには下記を行います。

1.	ﾍﾙﾌﾟ/登録/ﾌｧｯｸｽか郵送を選択します。標準ﾃｷｽﾄｴﾃﾞｨﾀにTrimble Geomatics Officeご登録用紙が表示されます。

2.	該当事項を記入します。*印の付けられた全ﾌｨｰﾙﾄﾞに記入が必須です。

3.	用紙を保存します。

4.	用紙を以下に送ります。

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard,Suite 100

Westminster,CO 80021

USA

Attention:Technical Publications Group

ﾌｧｯｸｽ:+1 720 887-6101


GPS環閉合ﾚﾎﾟｰﾄ　－　概要

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
概要

GPS環閉合ﾚﾎﾟｰﾄは､網の中のGPS観測の質を判断するための手助けとなります。それを使用して､基線処理結果でｴﾗｰをﾁｪｯｸすることができます。（基線処理ﾓｼﾞｭｰﾙがｲﾝｽﾄｰﾙされている場合のみ）しかしながら､環閉合を生成するには､閉じた幾何図に網を設計してある必要があります。この場合､Trimble Geomatics Office は､可能性のある環のすべてを自動的に生成し､GPS環閉合ﾚﾎﾟｰﾄを作成します。

環閉合設定ﾀﾞｲｱﾛｸﾞは､環がどのように建設され分析されるのかを制御するために使用されます。GPS環閉合ﾚﾎﾟｰﾄ内の情報量を制御するためにも使用されます。環閉合設定は､ﾚﾎﾟｰﾄ/設定/GPS環閉合ﾚﾎﾟｰﾄからｱｸｾｽできます。

標準GPS環閉合ﾚﾎﾟｰﾄは､以下のｾｸｼｮﾝを含みます。

ﾍｯﾀﾞｰ

要旨

不合格の環

不合格の環の基線

不合格の環の観測

以下のような追加のﾚﾎﾟｰﾄｾｸｼｮﾝは､｢環閉合設定｣ﾀﾞｲｱﾛｸﾞでそれを選択することでﾚﾎﾟｰﾄに含めることができます。

不合格の環の詳細

合格の環

合格の環の詳細

以下のｶﾞｲﾄﾞﾗｲﾝを参考にしてください。

小さい不閉合が好まれます。不併合が大きいことは､環の中の1つ以上の観測に問題があることを意味します。

大きい不閉合は､ｽﾃｰｼｮﾝが正しく設置されなかったり､誤ったｱﾝﾃﾅ情報が入力されたりといった､ﾌｨｰﾙﾄﾞで起こる失敗に帰することがよくあります。複数の不合格の環の要素としてﾌﾗｸﾞが付けられている観測に関連する情報の正しさを確認するためにﾌｨｰﾙﾄﾞﾉｰﾄをﾁｪｯｸします。

閉じられた幾何図から成る網を設計する時､それぞれの図の異なるｾｯｼｮﾝから基線を含めるような方法で網が観測されることを確認します。すべてが同じｾｯｼｮﾝで観測された基線を使用して環を生成する場合には､共通ｽﾃｰｼｮﾝ設置ｴﾗｰを探知することはできません。

ﾉｰﾄ：環閉合ﾚﾎﾟｰﾄから､測量表示のGPS環にﾘﾝｸすることができます。


GPS環閉合ﾚﾎﾟｰﾄｰﾍｯﾀﾞｰ

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
ﾚﾎﾟｰﾄﾍｯﾀﾞｰはどのﾚﾎﾟｰﾄにも含まれます。それには､引用された一般ﾌﾟﾛｼﾞｪｸﾄ情報と目次部分を含みます。目次部分は､さまざまなﾚﾎﾟｰﾄｾｸｼｮﾝへとｼﾞｬﾝﾌﾟするために使用可能なﾊｲﾊﾟｰﾘﾝｸを持ちます。

それは､以下のﾌｨｰﾙﾄﾞを含みます。そのほとんどは使用者がﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨで特定した情報を含みます。

ﾌﾟﾛｼﾞｪｸﾄ

このﾌｨｰﾙﾄﾞは､ﾌﾟﾛｼﾞｪｸﾄ名を示します。

使用者名

このﾌｨｰﾙﾄﾞは､名前を示します。

日付と時刻

このﾌｨｰﾙﾄﾞは､ﾚﾎﾟｰﾄが生成された日付と時刻を示します。

座標系

このﾌｨｰﾙﾄﾞは､座標系を示します。

ｿﾞｰﾝ

このﾌｨｰﾙﾄﾞは､座標系ｿﾞｰﾝを示します。GPSｷｬﾘﾌﾞﾚｰｼｮﾝｻｲﾄが選択される場合には､ｻｲﾄ名はｿﾞｰﾝﾌｨｰﾙﾄﾞに表示されます。

発行された座標系すべてはｿﾞｰﾝを持ちます。唯一の例外は､ｿﾞｰﾝﾌｨｰﾙﾄﾞに｢標準｣と表示する標準投影です。標準は､N =10000､E =10000､標高=100のように､ｻｲﾄの座標を仮定する時に使用されます。

ﾌﾟﾛｼﾞｪｸﾄ測地

このﾌｨｰﾙﾄﾞは､ﾌﾟﾛｼﾞｪｸﾄ測地を示します。それは､調整のために選択された測地の代行はしません。

垂直測地

網平均ﾚﾎﾟｰﾄﾍｯﾀﾞｰ情報にこのﾌｨｰﾙﾄﾞを追加することができます。これを行うには､｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞ－ﾌﾟﾛｼﾞｪｸﾄ詳細ﾀﾌﾞで垂直測地ﾌｨｰﾙﾄﾞに必要な詳細を追加します。

ｼﾞｵｲﾄﾞﾓﾃﾞﾙ

このﾌｨｰﾙﾄﾞは､ﾓﾃﾞﾙがﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨで割り当てられた場合には､ｼﾞｵｲﾄﾞﾓﾃﾞﾙ を示します。ｼﾞｵｲﾄﾞﾓﾃﾞﾙがﾌﾟﾛｼﾞｪｸﾄに割り当てられない場合には､｢無選択｣がこのﾌｨｰﾙﾄﾞに表示されます。

座標単位

このﾌｨｰﾙﾄﾞは､座標系の単位を示します。

距離単位

このﾌｨｰﾙﾄﾞは､距離単位を示します。

高度単位

このﾌｨｰﾙﾄﾞは､高度単位を示します。

目次

GPS環閉合ﾚﾎﾟｰﾄの目次は､環閉合設定ﾀﾞｲｱﾛｸﾞの設定によって制御されます。標準GPS環閉合ﾚﾎﾟｰﾄは､以下のｾｸｼｮﾝを含みます。

ﾍｯﾀﾞｰ

要旨

不合格の環

不合格の環の基線

不合格の環の観測

以下のような追加のﾚﾎﾟｰﾄｾｸｼｮﾝは､｢環閉合設定｣ﾀﾞｲｱﾛｸﾞでそれを選択することでﾚﾎﾟｰﾄに含めることができます。

不合格の環の詳細

合格の環

合格の環の詳細


GPS環閉合ﾚﾎﾟｰﾄ　－　要旨

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
要旨ｾｸｼｮﾝは環閉合の分析結果の簡潔な概要を提供します。それは標準ﾚﾎﾟｰﾄの中に含まれ､以下の情報が含まれます。

環の辺数

このﾌｨｰﾙﾄﾞは､環の側面を形成するために使用される観測の数を示します。標準は3です。3つ以上の辺が特定される場合には､その数字以下の辺を持つすべての環が生成されます。例えば､5と特定された場合には､5つ､4つ､3つの面を持つすべての環はﾚﾎﾟｰﾄで考慮されます。

環の数

このﾌｨｰﾙﾄﾞは､生成された環の数を示します。

合格数

このﾌｨｰﾙﾄﾞは､許容基準に合格する環の数を示します。

不合格数

このﾌｨｰﾙﾄﾞは､許容基準に合格しない環の辺数を示します。

合格 / 不合格基準

このﾌｨｰﾙﾄﾞは､完全水平と垂直許容値を示します。

最適

このﾌｨｰﾙﾄﾞは､生成された最適な環の結果を示します。

最悪

このﾌｨｰﾙﾄﾞは､最悪な環の結果を示します。

平均の環

このﾌｨｰﾙﾄﾞは､このﾚﾎﾟｰﾄに対して生成されたすべての環の平均に対する結果を示します。

標準偏差

このﾌｨｰﾙﾄﾞは､このﾚﾎﾟｰﾄに対して生成されたすべての環の標準偏差を示します。


GPS環閉合ﾚﾎﾟｰﾄ　－　不合格の環

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
不合格の環ｾｸｼｮﾝは､不閉合許容度ﾃｽﾄに合格しないそれぞれの環に関する情報を提供します。不閉合が｢GPS環閉合設定｣ﾀﾞｲｱﾛｸﾞで特定された許容度を超えると､環は不合格となります。このｾｸｼｮﾝは標準ﾚﾎﾟｰﾄに含まれます。

1つの不合格の環を示すﾚﾎﾟｰﾄｾｸｼｮﾝのｻﾝﾌﾟﾙが以下に示されています。

GPS環1:
MOON 2:WAVE:N 245:MOON 2

観測

		始点	終点	解ﾀｲﾌﾟ	開始時刻
B3	S1	MOON 2	WAVE	L1ﾌｨｯｸｽ	13:45:03 24 Feb 1999
B47	S5	MOON 2	WAVE	L1ﾌｨｯｸｽ	13:11:03 24 Feb 1999
B2	S8	WAVE	N 245	L1ﾌｨｯｸｽ	13:45:03 24 Feb 1999
B46	S4	MOON 2	N 245	L1ﾌｨｯｸｽ	13:43:48 24 Feb 1999
B49	S7	MOON 2	N 245	L1ﾌｨｯｸｽ	12:28:33 24 Feb 1999

環1に対して不合格となった組合せ

	長さ	水平ﾃﾞﾙﾀ	垂直ﾃﾞﾙﾀ	ppm
S5 －S8 －S7	3295.499m	0.026m	0.034m	12.915
観測表

表の最初の2列は､環で使用されるGPS観測の基線IDと解ID（その順序で）を示しています。基線IDは､基線を形成するために処理可能なGPSﾃﾞｰﾀの､2つの交差するｾｯﾄの組合せを意味します。解IDは､基線ﾌﾟﾛｾｯｻによる基線の実際の解を意味します。1つの基線IDに対して複数の解IDが存在することがあります。GPS処理結果を保存する時に｢重複する基線解を上書きする｣ﾁｪｯｸﾎﾞｯｸｽがｵﾌになっている場合にこれが起こります。

その他の列は以下に説明されています。

始点

このﾌｨｰﾙﾄﾞは､観測の開始点を示します。

終点

このﾌｨｰﾙﾄﾞは､観測の終了点を示します。

解ﾀｲﾌﾟ

このﾌｨｰﾙﾄﾞは､観測に対する解ﾀｲﾌﾟを示します。

開始時刻

このﾌｨｰﾙﾄﾞは､観測に対する開始時刻を示します。

｢不合格となった環[番号#]の組合せ｣表

｢不合格となった環の組合せ｣表は､許容度を超える不閉合を生成したGPS観測の組合せを識別します。上の例は､単独の組合せを示しています。複数の不合格が発生すると､複数の組合せが表示されます。表の最初の列は､不合格の組合わせの基線解を示します。

ﾋﾝﾄ:不合格となった組合せをｸﾘｯｸすると､その観測は測量表示で反転表示されます。

その他の列は以下に説明されています。

長さ

このﾌｨｰﾙﾄﾞは､環の周辺の合計移動距離を示します。

水平ﾃﾞﾙﾀ

このﾌｨｰﾙﾄﾞは､この環によって生成された水平不閉合を示します。

垂直ﾃﾞﾙﾀ

このﾌｨｰﾙﾄﾞは､この環によって生成された垂直不閉合を示します。

ppm

このﾌｨｰﾙﾄﾞは､ppmで示される合計水平･垂直不閉合を示します。


GPS環閉合ﾚﾎﾟｰﾄ　－　不合格の環の基線

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
このｾｸｼｮﾝは､網に適合しないGPS基線を識別する手助けをします。それはすべての不合格の環を検査し､複数の不合格の環で見つかった基線をﾚﾎﾟｰﾄすることでそれを行います。一番頻繁に発生する不合格の環が一覧の一番上に来るように､一覧は発生頻度によって整理されています。それには､悪質の解を識別するための手助けとなる可能性がある基線要旨統計も含まれています。

このｾｸｼｮﾝは､標準ﾚﾎﾟｰﾄに含まれています。

ﾚﾎﾟｰﾄｾｸｼｮﾝのｻﾝﾌﾟﾙは以下の通りです。

		始点	終点	解ﾀｲﾌﾟ	ﾗｼｵ	ﾘﾌｧﾚﾝｽﾊﾞﾘｱﾝｽ	RMS	発生回数
B2	S8	WAVE	N 245	L1ﾌｨｯｸｽ	21.8	2.489	0.006	3
B47	S5	MOON 2	WAVE	L1ﾌｨｯｸｽ	2.9	1.693	0.005	2
B5	S19	COWBOY	KTOM	L1ﾌｨｯｸｽ	8.5	1.117	0.009	1

上に戻る

表の最初の2列は､複数の不合格の環の要素であるGPS観測の基線IDと解ID（その順序で）を示しています。基線IDは､基線を形成するために処理可能なGPSﾃﾞｰﾀの､2つの交差するｾｯﾄの組合せを意味します。解IDは､基線ﾌﾟﾛｾｯｻによる基線の実際の解を意味します。1つの基線IDに対して複数の解IDが存在することがあります。GPS処理結果を保存する時に｢重複する基線解を上書きする｣ﾁｪｯｸﾎﾞｯｸｽがｵﾌになっている場合にこれが起こります。

その他の列は以下に説明されています。

始点

このﾌｨｰﾙﾄﾞは､観測の開始点を示します。

終点

このﾌｨｰﾙﾄﾞは､観測の終了点を示します。

開始時刻

このﾌｨｰﾙﾄﾞは､GPS観測の時刻と時刻を示します。

ﾗｼｵ

このﾌｨｰﾙﾄﾞは､基線ﾌﾟﾛｾｯｻによって限定されたGPSの観測のﾗｼｵを示します。

ﾘﾌｧﾚﾝｽﾊﾞﾘｱﾝｽ

このﾌｨｰﾙﾄﾞは､基線ﾌﾟﾛｾｯｻによって限定されたGPSの観測のﾘﾌｧﾚﾝｽﾊﾞﾘｱﾝｽを示します。

RMS

このﾌｨｰﾙﾄﾞは､基線ﾌﾟﾛｾｯｻによって限定されたGPSの観測のRMSを示します。

発生回数

このﾌｨｰﾙﾄﾞは､GPS観測が要素であった不合格の環の数を示します。発生回数の高い観測は､網への適合性に関して再検討されるべきです。


GPS環閉合ﾚﾎﾟｰﾄ　－　不合格の環の観測

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
このｾｸｼｮﾝは､網に適合しない基線に対するGPSｽﾃｰｼｮﾝ観測を識別する手助けをしてくれます。こういったｽﾃｰｼｮﾝ観測は､ｽﾃｰｼｮﾝ設定ｴﾗｰを持つかもしれません。それは､すべての不合格の環を検査し､複数の不合格の環で見つかった基線を限定し､こういった基線に共通する観測をﾚﾎﾟｰﾄすることでそれを行います。一番頻繁に発生する不合格の環が一覧の一番上に来るように､一覧は発生頻度によって整理されています。それには､悪質の解を識別するための手助けとなる可能性のある基線要旨統計も含まれています。

このｾｸｼｮﾝは､標準ﾚﾎﾟｰﾄに含まれています。

ﾚﾎﾟｰﾄｾｸｼｮﾝのｻﾝﾌﾟﾙは以下に示されています。

不合格の環の観測

ﾎﾟｲﾝﾄ	開始時刻	発生回数
KTOM	10:46:18 24 Feb 1999	6
WAVE	13:11:03 24 Feb 1999	5
MOON2	12:04:48 24 Feb 1999	4
COWBOY	14:05:03 24 Feb 1999	3
N 245	12:28:33 24 Feb 1999	2
COWBOY	12:45:48 24 Feb 1999	1
上に戻る

列に関しては以下で説明されます。

ﾎﾟｲﾝﾄ

このﾌｨｰﾙﾄﾞは､観測が起こったﾎﾟｲﾝﾄの名前を示します。

開始時刻

このﾌｨｰﾙﾄﾞは､観測の時刻を示します。ﾌﾟﾛｼﾞｪｸﾄに含まれる情報に反してﾌｨｰﾙﾄﾞﾉｰﾄを立証するためにその時刻を使用します。

発生回数

このﾌｨｰﾙﾄﾞは､この観測が不合格の環の要素である観測に対して使用された回数を示します。発生回数の高い観測は､ｽﾃｰｼｮﾝ設定ｴﾗｰに対して検査されるべきです。


GPS環閉合ﾚﾎﾟｰﾄ　－　不合格の環の詳細

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
このｾｸｼｮﾝは､不閉合許容度ﾃｽﾄに不合格したそれぞれの環に関する詳細情報を提供します。このﾚﾎﾟｰﾄは標準ﾚﾎﾟｰﾄには含まれません。環閉合設定ﾀﾞｲｱﾛｸﾞからこのｾｸｼｮﾝを起動することができます。

ﾚﾎﾟｰﾄｾｸｼｮﾝのｻﾝﾌﾟﾙは以下に示されています。

不合格の環の詳細

環 S1 - S86 - S3:

始点:	MOON 2
終点:	WAVE		L1ﾌｨｯｸｽ	13:45:02 24 Feb 1999
		傾斜:	962.407m	606819.055m
		合計:	962.407m	1828548.125m
				29.499m
終点:	N 245		L1 ﾌﾛｰﾄ	13:45:02 24 Feb 1999
		傾斜:	852.542m	606662.061m
		合計:	1814.949m	1829386.030m
				33.251m
終点:	MOON 2		L1ﾌｨｯｸｽ	13:43:47 24 Feb 1999
		傾斜:	1480.504m	605983.905m
		合計:	3295.453m	1828070.086m
				26.770m
精度:		32.407ppm
ｴﾗｰ	水平:	0.096m	垂直:	－0.046m

表の一番上には､環の要素である基線解の一覧があります。この後には､環が始まるﾎﾟｲﾝﾄである始点ｽﾃｰｼｮﾝが続きます。

この最初の情報の後には､3つ以上のｻﾌﾞｾｸｼｮﾝ（各4行）が続きます。こういったｻﾌﾞｾｸｼｮﾝはｽﾃｰｼｮﾝ情報を含み､ﾌﾟﾛｸﾞﾗﾑが環の周りを移動する順序で提供されます。それぞれのｻﾌﾞｾｸｼｮﾝの第1行目は､｢終点｣識別名で始まります。以下の情報が､こういったｽﾃｰｼｮﾝのｻﾌﾞｾｸｼｮﾝで提供されます。

第1行目

｢終点｣識別名が､4行構成のｻﾌﾞｾｸｼｮﾝの第1行目に置かれます。この行はGPS観測に関する情報を提供します。｢終点｣識別名の後には､環が移動した順序で一覧化されたﾎﾟｲﾝﾄの名前が続きます。これの後には､GPS観測のﾀｲﾌﾟと､GPS計測が収集された日付が続きます。

この行で提供される情報は､表の一番上に提示された解IDの1つに対応しています。特定の基線解に関する詳細は､測量表示でﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを使用してその統計を検査するか､その基線に対するGPS基線処理ﾚﾎﾟｰﾄを生成することで得られます。

第2行目

｢傾斜｣識別名が､4行構成のｻﾌﾞｾｸｼｮﾝの第2行目に置かれます。識別名の後には､GPS観測の斜距離が続きます。この後には､現在の終点座標の北距要素が続きます。

第3行目

｢合計｣識別名が､4行構成のｻﾌﾞｾｸｼｮﾝの第3行目に置かれます。識別名の後には､環を形成するのにその時点までの合計移動距離が続きます。この後には､現在の終点座標の東距要素が続きます。

第4行目

ｻﾌﾞｾｸｼｮﾝの最後の行は識別名を持ちません。それは現在の終点座標の高度を含みます。

ﾉｰﾄ：ここでﾚﾎﾟｰﾄされた北距と東距､高度座標は､ﾌﾟﾛｼﾞｪｸﾄ内で見つかるのと同じ座標ではありません。ここで表示される値は､最初の始点ｽﾃｰｼｮﾝ座標にGPS座標を追加し､環の周辺でこのﾍﾞｸﾄﾙ追加を継続することによって引き出されます。環の終わりでは､この方法で引き出された座標は不閉合を生成するために最初の始点座標から取り去られます。

この表の最後のｽﾃｰｼｮﾝｻﾌﾞｾｸｼｮﾝは､環が閉合されたことを示す､始点ｽﾃｰｼｮﾝに対するものです。表の最後の2行は､環の不閉合に関する情報を提供します。

精度

このﾌｨｰﾙﾄﾞは､ppmで示された合計水平･垂直不閉合を示します。

ｴﾗｰ

このﾌｨｰﾙﾄﾞは､この環によって生成された水平と垂直の不閉合を示します。


GPS環閉合ﾚﾎﾟｰﾄ　－　合格の環

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
このｾｸｼｮﾝは､許容度ﾃｽﾄに合格したそれぞれの環に関する情報を提供します。環の不閉合が特定された許容度以内であると､その環は合格します。このｾｸｼｮﾝは標準ﾚﾎﾟｰﾄに含まれません。環閉合設定ﾀﾞｲｱﾛｸﾞからこのｾｸｼｮﾝを起動することができます。

ﾚﾎﾟｰﾄｾｸｼｮﾝのｻﾝﾌﾟﾙは以下に示されています。

合格の環

GPSの環1:
MOON 2:WAVE:COWBOY:MOON 2

観測

基線ID	解ID	始点	終点	解ﾀｲﾌﾟ	開始時刻
B3	S1	MOON 2	WAVE	L1ﾌｨｯｸｽ	13:45:02 24 Feb 1999
B47	S4	MOON 2	WAVE	L1ﾌｨｯｸｽ	13:11:02 24 Feb 1999
B1	S9	WAVE	COWBOY	L1ﾌｨｯｸｽ	14:05:02 24 Feb 1999
B45	S2	MOON 2	COWBOY	L1ﾌｨｯｸｽ	14:05:02 24 Feb 1999
B48	S5	MOON 2	COWBOY	L1ﾌｨｯｸｽ	12:45:47 24 Feb 1999
環1に対する合格した組合せ

	長さ	水平ﾃﾞﾙﾀ	垂直ﾃﾞﾙﾀ	ppm
S1 -S9 -S2	3795.569m	0.001m	-0.002m	0.508
S1 -S9 -S5	3795.577m	0.009m	0.001m	2.296
S4 -S9 -S2	3795.568m	0.018m	-0.012m	5.683
S4 -S9 -S5	3795.577m	0.020m	-0.009m	5.872

観測表

表の最初の2列は､環で使用されるGPS観測の基線IDと解ID（その順序で）を示しています。基線IDは､基線を形成するために処理可能なﾃﾞｰﾀの､2つの交差するｾｯﾄの組合せを意味します。解IDは､基線ﾌﾟﾛｾｯｻによる基線の実際の解を意味します。1つの基線IDに対して複数の解IDが存在することがあります。GPS処理結果を保存する時に｢重複する基線解を上書きする｣ﾁｪｯｸﾎﾞｯｸｽがｵﾌになっている場合にこれが起こります。

その他の列は以下に説明されています。

始点

このﾌｨｰﾙﾄﾞは､観測の開始点を示します。

終点

このﾌｨｰﾙﾄﾞは､観測の終了点を示します。

解ﾀｲﾌﾟ

このﾌｨｰﾙﾄﾞは､観測に対する解ﾀｲﾌﾟを示します。

開始時刻

このﾌｨｰﾙﾄﾞは､観測に対する開始時刻を示します。

｢合格した環[番号#]の組合せ｣表

｢合格した環[番号#]の組合せ｣表は､許容範囲以内の不閉合を生成するGPS観測の組合せを識別します。最初の列は､合格した組合せの基線解を示します。

ﾋﾝﾄ:合格した組合せをｸﾘｯｸすると､観測は測量表示で反転表示されます。

2番目の列のｾｯﾄは以下に説明されています。

長さ

このﾌｨｰﾙﾄﾞは､環の周辺の合計移動距離を示します。

水平ﾃﾞﾙﾀ

このﾌｨｰﾙﾄﾞは､この環によって生成された水平不閉合を示します。

垂直ﾃﾞﾙﾀ

このﾌｨｰﾙﾄﾞは､この環によって生成された垂直不閉合を示します。

ppm

このﾌｨｰﾙﾄﾞは､ppmで示される合計水平･垂直不閉合を示します。


GPS環閉合ﾚﾎﾟｰﾄ　－　合格の環の詳細

詳細

利用方法	ﾚﾎﾟｰﾄ	関連項目
このｾｸｼｮﾝは､不閉合許容度ﾃｽﾄに合格したそれぞれの環に関する詳細情報を提供します。これは標準ﾚﾎﾟｰﾄには含まれません。環閉合設定ﾀﾞｲｱﾛｸﾞからこのｾｸｼｮﾝを起動することができます。

ﾚﾎﾟｰﾄｾｸｼｮﾝのｻﾝﾌﾟﾙは以下に示されています。

合格の環の詳細

環S1 -S9 -S2:

始点:	MOON 2
終点:	WAVE		L1ﾌｨｯｸｽ	13:45:02 24 Feb 1999
		傾斜:	962.407m	606819.055m
		合計:	962.407m	1828548.125m
				29.499m
終点:	COWBOY		L1ﾌｨｯｸｽ	14:05:02 24 Feb 1999
		傾斜:	1076.569m	607738.388m
		合計:	2038.976m	1827988.084m
				22.331m
終点:	MOON 2		L1ﾌｨｯｸｽ	14:05:02 24 Feb 1999
		傾斜:	1756.593m	605983.815m
		合計:	3795.569m	1828070.120m
				26.815m
精度:	0.50858508651573ppm
ｴﾗｰ	水平:	0.001m	垂直:	－0.002m

表の一番上には､環の要素である基線解の一覧があります。この後には､環が始まるﾎﾟｲﾝﾄである始点ｽﾃｰｼｮﾝが続きます。

この最初の情報の後には､3つ以上のｻﾌﾞｾｸｼｮﾝ（各4行）が続きます。こういったｻﾌﾞｾｸｼｮﾝはｽﾃｰｼｮﾝ情報を含み､ﾌﾟﾛｸﾞﾗﾑが環の周りを移動する順序で提供されます。それぞれのｻﾌﾞｾｸｼｮﾝの第1行目は､｢終点｣識別名で始まります。以下の情報が､こういったｽﾃｰｼｮﾝのｻﾌﾞｾｸｼｮﾝで提供されます。

第1行目

｢終点｣識別名が､4行構成のｻﾌﾞｾｸｼｮﾝの第1行目に置かれます。この行自体がGPS観測に関する情報を提供します。｢終点｣識別名の後には､環が移動した順序で一覧化されたﾎﾟｲﾝﾄの名前が続きます。これの後には､GPS観測のﾀｲﾌﾟと､GPS計測が収集された日付が続きます。

この行で提供される情報は､表の一番上に提示された解IDの1つに対応しています。特定の基線解に関する詳細は､測量表示でﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを使用してその統計を検査するか､その基線に対するGPS基線処理ﾚﾎﾟｰﾄを生成することで得られます。

第2行目

｢傾斜｣識別名が､4行構成のｻﾌﾞｾｸｼｮﾝの第2行目に置かれます。識別名の後には､GPS観測の斜距離が続きます。この後には､現在の終点座標の北距要素が続きます。

第3行目

｢合計｣識別名が､4行構成のｻﾌﾞｾｸｼｮﾝの第3行目に置かれます。識別名の後には､環を形成するのにその時点までに移動した合計距離が続きます。この後には､現在の終点座標の東距要素が続きます。

第4行目

ｻﾌﾞｾｸｼｮﾝの最後の行は識別名を持ちません。それは現在の終点座標の高度を含みます。

ﾉｰﾄ：ここでﾚﾎﾟｰﾄされた北距と東距､高度座標は､ﾌﾟﾛｼﾞｪｸﾄ内で見られるのと同じ座標ではありません。ここで表示される値は､最初の始点ｽﾃｰｼｮﾝ座標にGPS座標を追加し､環の周辺でこのﾍﾞｸﾄﾙ追加を継続することによって引き出されます。環の終わりでは､この方法で引き出された座標は不閉合を生成するために最初の始点座標から取り去られます。

この表の最後のｽﾃｰｼｮﾝｻﾌﾞｾｸｼｮﾝは､環が閉合されたことを示す､始点ｽﾃｰｼｮﾝに対するものです。表の最後の2行は､環の不閉合に関する情報を提供します。

精度

このﾌｨｰﾙﾄﾞは､ppmで示された合計水平･垂直不閉合を示します。

ｴﾗｰ

このﾌｨｰﾙﾄﾞは､この環によって生成された水平と垂直の不閉合を示します。


｢GPS環閉合設定｣ﾀﾞｲｱﾛｸﾞ

詳細

利用方法

このﾀﾞｲｱﾛｸﾞを使用して､環閉合ｵﾌﾟｼｮﾝを設定し､GPS環閉合ﾚﾎﾟｰﾄに含まれるｾｸｼｮﾝを選択します。

｢環閉合設定｣ﾀﾞｲｱﾛｸﾞを表示するには､以下の1つを行います。:

ﾚﾎﾟｰﾄ/設定/GPS環閉合ﾚﾎﾟｰﾄを選択します。

Altを押しながらR､S､Lｷｰをその順で押します。

｢環閉合設定｣ﾀﾞｲｱﾛｸﾞが現れます。

以下のｺﾝﾄﾛｰﾙやｸﾞﾙｰﾌﾟが含まれます。

環の辺数

環の側面を形成するために使用される観測の数を特定するために､このﾌｨｰﾙﾄﾞを編集します。標準は3です。3つ以上の辺が特定される場合には､その数字以下の辺を持つすべての環が生成されます。例えば､5と特定された場合には､5つ､4つ､3つの面を持つすべての環がﾚﾎﾟｰﾄで考慮されます。

許容度

ﾌﾟﾛｼﾞｪｸﾄに対して必要な精度要求に合わせる最大許容可能不閉合を定義するために､このﾌｨﾙﾀｰを編集します。この許容度を超える不閉合は､GPS環閉合ﾚﾎﾟｰﾄで不合格の環としてﾚﾎﾟｰﾄされます。許容度は､完全距離かppmで示されるﾗｼｵを基にしています。

｢完全｣が選択されると､水平･垂直ﾌｨｰﾙﾄﾞが利用できるようになります。こういったﾌｨｰﾙﾄﾞに水平･垂直距離許容値を入力して､受け入れ最大不閉合を特定します。

｢ﾗｼｵ｣が選択されると､ppmﾌｨｰﾙﾄﾞが利用できるようになります。最大受け入れ不閉合をppmで入力します。ﾗｼｵが選択されると､水平･垂直不閉合は不閉合許容度ﾃｽﾄを実行する前に組み合わされます。

ﾚﾎﾟｰﾄｾｸｼｮﾝ

このｸﾞﾙｰﾌﾟのﾁｪｯｸﾎﾞｯｸｽを使用して､GPS環閉合ﾚﾎﾟｰﾄ内に含まれるｾｸｼｮﾝを選択します。以下のｾｸｼｮﾝを含むことができます。

全般要旨

不合格の環

不合格の環の詳細

不合格の環の基線

不合格の環の観測

合格の環

合格の環の詳細

標準では以下のｾｸｼｮﾝが含まれます。

全般要旨

不合格の環

不合格の環の基線

不合格の環の観測

どのｾｸｼｮﾝもそのﾁｪｯｸﾎﾞｯｸｽをｵﾌにすることで除去することができます。それぞれのﾁｪｯｸﾎﾞｯｸｽをｵﾝにすることでその他のｾｸｼｮﾝをﾚﾎﾟｰﾄに含むことができます。

ｱｸﾃｨﾌﾞな解のみ使用

環閉合ﾚﾎﾟｰﾄにｱｸﾃｨﾌﾞな解だけを含みたい場合にはこのﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。


｢GPS環閉合ﾚﾎﾟｰﾄ｣ｺﾏﾝﾄﾞ

利用方法	ﾚﾎﾟｰﾄ

このｺﾏﾝﾄﾞを使用して､環閉合分析を実行し､ﾚﾎﾟｰﾄﾌｫｰﾏｯﾄで結果を表示します。

GPS環閉合ﾚﾎﾟｰﾄを見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､GPS環閉合ﾚﾎﾟｰﾄが読み込まれます。


GPS環閉合ﾚﾎﾟｰﾄの設定

詳細

利用方法	ﾀﾞｲｱﾛｸﾞ

GPS環閉合ﾚﾎﾟｰﾄに含まれたｾｸｼｮﾝを選ぶために､このｺﾏﾝﾄﾞを選択します。

｢GPS環閉合ﾚﾎﾟｰﾄ設定｣ﾀﾞｲｱﾛｸﾞを見るには､以下の1つを行います。

ﾚﾎﾟｰﾄ/設定/GPS環閉合ﾚﾎﾟｰﾄを選択します。

Altを押しながらR､S､Lｷｰをその順で押します。.

ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､GPS環閉合ﾚﾎﾟｰﾄの設定ﾀﾞｲｱﾛｸﾞが現れます。

ﾉｰﾄ：いくつかのｾｸｼｮﾝは標準で表示されるようになっており､その他のｾｸｼｮﾝは追加することができます。ﾚﾎﾟｰﾄの内容をｶｽﾀﾏｲｽﾞするためにﾁｪｯｸﾎﾞｯｸｽをあらゆる組合せでｵﾝにしたりｵﾌにしたりできます。


｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞ

このﾀﾞｲｱﾛｸﾞを使用して､ﾃﾞｰﾀﾍﾞｰｽ全体をﾚﾎﾟｰﾄするか選択した環だけをﾚﾎﾟｰﾄするかを選択します。

GPS環閉合ﾚﾎﾟｰﾄを見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､GPS環閉合ﾚﾎﾟｰﾄが読み込まれます。


環閉合のﾁｪｯｸ

基線処理の後に､質の許容範囲に合格しなかった基線にそれぞれ印しを付けるために測量表示ｳｨﾝﾄﾞｳに赤い警告ﾌﾗｸﾞが現れることがあります。警告ﾌﾗｸﾞを持つ基線は､環閉合分析を実行すると､大きな不閉合を起こす可能性もあります。

悪質の不閉合を起こす可能性のあるｴﾗｰの原因には､以下が含まれます。

間違った測量ﾎﾟｲﾝﾄを設定

不正確なｱﾝﾃﾅ情報を入力

悪質の処理結果

環閉合をﾁｪｯｸするには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､GPS環閉合ﾚﾎﾟｰﾄが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	要旨をｸﾘｯｸします。

環閉合ﾚﾎﾟｰﾄの要旨ｾｸｼｮﾝが現れます。


GPS環閉合ﾚﾎﾟｰﾄの設定

概要と詳細

GPS環閉合ﾚﾎﾟｰﾄｾｸｼｮﾝは､ﾚﾎﾟｰﾄの内容をｺﾝﾄﾛｰﾙするためにｵﾝにしたりｵﾌにしたりすることができます。標準では､以下のﾚﾎﾟｰﾄｾｸｼｮﾝはｵﾝになっています。

要旨

不合格の環

不合格の環の基線

不合格の環の観測

ｵﾝすることによって､下記のﾚﾎﾟｰﾄｾｸｼｮﾝも含めることができます。

不合格の環の詳細

合格の環

合格の環の詳細

ﾚﾎﾟｰﾄｾｸｼｮﾝをｵﾝにしたりｵﾌにしたりするためには､

1.	GPS環閉合ﾚﾎﾟｰﾄを見るには､以下の1つを行います。

ﾚﾎﾟｰﾄ/設定/GPS環閉合ﾚﾎﾟｰﾄを選択します。

Altを押しながらR､S､Lｷｰをその順で押します。.

環閉合設定ﾀﾞｲｱﾛｸﾞが現れます。

2.	ﾚﾎﾟｰﾄｾｸｼｮﾝｸﾞﾙｰﾌﾟで適切なﾁｪｯｸﾎﾞｯｸｽをｵﾝにしたりｵﾌにしたりします。


GPS環閉合ﾚﾎﾟｰﾄの要旨を表示

概要と詳細

ﾚﾎﾟｰﾄの要旨を見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	要旨をｸﾘｯｸします。

要旨ｾｸｼｮﾝが現れます。


GPS環閉合ﾚﾎﾟｰﾄの表示

概要と詳細

ﾚﾎﾟｰﾄを見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択�選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄが現れます。

3.	目次のﾊｲﾊﾟｰﾘﾝｸを使用して､ﾚﾎﾟｰﾄｾｸｼｮﾝにｼﾞｬﾝﾌﾟし､ﾃﾞｰﾀを審査します。


GPS環閉合ﾚﾎﾟｰﾄﾍｯﾀﾞｰの表示

概要と詳細

ﾚﾎﾟｰﾄﾍｯﾀﾞｰを見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	ｽｸﾛｰﾙﾊﾞｰを使用してﾃﾞｰﾀを審査します。


GPS環閉合､合格の環の統計の表示

概要と詳細

合格の環ｾｸｼｮﾝは､どの環が不閉合許容度ﾃｽﾄに合格したかを識別します。このﾚﾎﾟｰﾄｾｸｼｮﾝは､標準ﾚﾎﾟｰﾄには現れません。環閉合設定ﾀﾞｲｱﾛｸﾞでそれを選択することでこのｾｸｼｮﾝをﾚﾎﾟｰﾄに含むことができます。

合格の環の統計を見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	合格の環をｸﾘｯｸします。

合格の環ｾｸｼｮﾝが現れます。


GPS環閉合､合格の環の詳細の表示

概要と詳細

合格の環の詳細ｾｸｼｮﾝは､不閉合許容度ﾃｽﾄに合格した環に関する詳細情報を提供します。このﾚﾎﾟｰﾄｾｸｼｮﾝは､標準ﾚﾎﾟｰﾄには現れません。環閉合設定ﾀﾞｲｱﾛｸﾞでそれを選択することによってﾚﾎﾟｰﾄにこのｾｸｼｮﾝを含むことができます。

合格の環の詳細を見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞ｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	合格の環の詳細をｸﾘｯｸします。

合格の環の詳細ｾｸｼｮﾝが現れます。


GPS環閉合､不合格の環の詳細の表示

概要と詳細

不合格の環の詳細ｾｸｼｮﾝは､不閉合許容度ﾃｽﾄに不合格となった環に関する詳細情報を提供します。このﾚﾎﾟｰﾄｾｸｼｮﾝは､標準ﾚﾎﾟｰﾄには現れません。環閉合設定ﾀﾞｲｱﾛｸﾞでそれを選択することによってﾚﾎﾟｰﾄにこのｾｸｼｮﾝを含むことができます。

不合格の環の詳細を見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

3.	不合格の環の詳細をｸﾘｯｸします。

不合格の環の詳細ｾｸｼｮﾝが現れます。


不合格の環の基線統計の表示

概要と詳細

不合格の環の基線ｾｸｼｮﾝは､網に適合しないGPS基線を識別する手助けをします。それは､すべての不合格の環を検査し､複数の不合格の環で見つかった基線をﾚﾎﾟｰﾄすることでそれを行います。一番頻繁に発生する不合格の環が一覧の一番上に来るように､一覧は発生頻度によって整理されています。それには､悪質の解を識別するための手助けとなる可能性がある基線要旨統計も含まれています。

不合格の環の基線を見るには､

1.	GPS環閉合ﾚﾎﾟｰﾄを見るには､以下の1つを行います。

ﾚﾎﾟｰﾄ/環閉合ﾚﾎﾟｰﾄを選択します。

Altを押しながらRｷｰとLｷｰをその順で押します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

2.	不合格の環の基線をｸﾘｯｸします。

不合格の環の基線ｾｸｼｮﾝが現れます。


不合格の環の観測統計の表示

概要と詳細

不合格の環の観測ｾｸｼｮﾝは､網に適合しない基線に対するGPSｽﾃｰｼｮﾝ観測を識別する手助けをします。こういったｽﾃｰｼｮﾝ観測は､ｽﾃｰｼｮﾝ設定ｴﾗｰを持つかもしれません。それは､すべての不合格の環を検査し､複数の不合格の環で見つかった基線を限定し､こういった基線に共通する観測をﾚﾎﾟｰﾄすることでそれを行います。一番頻繁に発生する不合格の環が一覧の一番上に来るように､一覧は発生頻度によって整理されています。

不合格の環の観測を見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	不合格の環の観測をｸﾘｯｸします。

不合格の環の観測ｾｸｼｮﾝが現れます。


不合格の環の統計の表示

概要と詳細

不合格の環の統計は､基線の辺が併合しなかった理由を識別します。

不合格の環の統計を見るには､

1.	ﾚﾎﾟｰﾄ/GPS環閉合ﾚﾎﾟｰﾄを選択します。ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで観測を選択した場合には､｢環閉合ﾚﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	以下のｵﾌﾟｼｮﾝの1つを選択します。

選択－選択した基線上で環閉合を実行します。

ﾃﾞｰﾀﾍﾞｰｽ全体－ﾃﾞｰﾀﾍﾞｰｽ全体で環閉合を実行します。

環閉合分析が完了すると､ｺﾝﾋﾟｭｰﾀの標準HTMLﾋﾞｭｰｱがｽﾀｰﾄし､ﾚﾎﾟｰﾄの一番上にﾍｯﾀﾞｰを持つﾚﾎﾟｰﾄが現れます。

3.	不合格の環をｸﾘｯｸします。

不合格の環ｾｸｼｮﾝが現れます。


基線警告ﾌﾗｸﾞﾌﾟﾛﾊﾟﾃｨの表示

概要と詳細

基線処理の後に､質の許容範囲に合格しなかったそれぞれの基線に印しを付けるためにｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに赤い警告ﾌﾗｸﾞが現れます。

警告ﾌﾗｸﾞ詳細を見るには､

1.	基線を選択します。

2.	ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを開きます。（右ｸﾘｯｸしてｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌﾟﾛﾊﾟﾃｨを選択します。）

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳが現れます。

3.	ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ選択一覧で基線の脇の｢＋｣ｱｲｺﾝをｸﾘｯｸします。

選択一覧図は､基線に対する始点と終点を拡張し表示します。赤いﾌﾗｸﾞは基線処理に問題があることを意味します。

4.	ﾌﾗｸﾞを持つﾎﾟｲﾝﾄを選択します。

5.	以下の1つを行います。

警告ﾌﾗｸﾞﾎﾞﾀﾝをｸﾘｯｸします。

詳細ﾍﾟｰｼﾞﾒﾆｭｰをｽﾀｰﾄし､警告を選択します。

ﾒｯｾｰｼﾞは､基線にﾌﾗｸﾞが付けられた理由を表示します。この情報を使用して､基線が許容範囲に合格するのを妨げている問題を解決します。詳細に関しては､GPS処理ﾃﾞｰﾀ分析を参照してください。


再計算－概要

再計算はポイントの位置の計算値を確立する処理です。

Trimble Geomatics Office はすべてのデータ，つまりポイントに関するすべてのGPS 観測，一般測量機観測，レーザー測距儀観測，キー入力された座標，インポートされた座標の再計算を行います。これらの観測やキー入力された座標を使用して，ポイントの考えられる最もよい質の位置を決定します。

再計算とは：

現場で観測されたポイントの位置を計算する

ポイントに適切な質を与える

データの較差を見つけ，レポートする

再計算レポートを作成する

ポイントに冗長なデータがある場合，ポイント関連レポートはどの観測，またはキー入力座標が位置の計算値の確立に使用されたか表示します。再計算レポートは許容値を超えるすべての冗長な観測を表示します。許容値はプロジェクトプロパティダイアログの再計算タブで定義されています。

データがプロジェクトに追加されたり，既存のデータが編集されたりした場合，例えば，GPS 観測のアンテナ高を変更した場合などは常に，再計算する必要があります。

しかし，Trimble Geomatics Office は自動的に再計算はしません。再計算が必要なとき，再計算アイコン [image] がTrimble Geomatics Office のステータスバーに表示されます。

再計算するには，下の1つを行います。

測量/再計算を選択する。

F4  を押す。

ステータスバーで再計算アイコン(あれば)をダブルクリックする。

右クリックでショートカットメニューを呼び出し，再計算を選択する。

ノート：いつでも再計算することができますが，再計算アイコンがステータスバーに表示されていない場合，何も変更されていません。

再計算は：

誤差を配分しません。

網平均された座標，基準点・測量の質のキー入力座標を観測よりも優先して使用します。

ノート：キー入力座標とは，Trimble Geomatics Office を使用してポイントに入力された座標，またはデータファイルからTrimble Geomatics Office プロジェクトにインポートされた座標のことです。


再計算－観測されたポイントの位置の計算値はどのように決定されるか

概要と詳細

下の図は，現場で観測されたポイントの位置の計算値を，再計算がどのようにして見つけるか説明しています。

ノート：観測されたポイントの位置の計算値が決定される時，再計算は無効の観測や無効のキー入力座標は使用しません。プロジェクトにポイントの座標を決めるために使用できる観測や座標が他にない場合，チェックとして有効な観測，キー入力座標を使用します。観測を有効にしたり無効にしたりするには，プロパティウィンドウを使用します。

これらのトピックスはフローチャートのボックスを説明しています。

再計算－可能な始点はどのように決定されるか

再計算－すべての可能な始点の位置はどのように決定されるか

再計算−成分の質がどのように始点を決定するか

再計算−観測は始点からどのように適用されるか

再計算−観測されたポイントの質はどのように決定されるか


再計算 － 可能な始点はどのように決定されるか

概要と詳細

再計算は次の特性をもつポイントから再計算を始めることができます。

キー入力された座標，そして

2つ以上の観測があるポイント

例えば，下の図はリアルタイムキネマティック(RTK )の基準局を表わしています。これは可能な始点です。


再計算－すべての可能な始点の位置はどのように決定されるか

概要と詳細

始点の位置はキー入力された座標から決定されます。可能な始点には通常，キー入力された座標が1つだけあります。位置の各成分(NE，e，h )の質は，キー入力された座標の質です。標高，または高度成分がキー入力されなかった場合，ジオイドモデルを使用して入力されていない成分を求めます。

次の場合，ポイントには2つ以上のキー入力座標があることもあります。

ポイントの座標をキー入力し，そのポイントを固定しないで網平均(網平均モジュールがインストールされている場合)を行った(これにより，ポイントの網平均座標が作成されます)。

ポイントのWGS-84 座標とグリッド基準座標をインポートした。

WGS-84 座標と標高をインポートした。標高はグリッド座標に一部として保存されます。

この場合，再計算はある判定基準を使用して，どの座標を位置の計算値として使用するか決定します。最初の判定基準では1つの座標に決定できなかった場合，次の判定基準を適用します。判定基準は下の順です。

1.	座標のステータス(有効/無効)

2.	最も質の高い成分

3.	WGS-84 座標がグリッド座標より優先して使用される。


再計算 －すべての可能な始点の位置はどのように決定されるか
再計算－すべての可能な始点の位置はどのように決定されるか：(1)座標のステータス

関連項目

座標のステータス(有効/無効)

始点の位置の決定の時，有効な座標だけが検討されます。観測がポイントの位置決めに使用されていない場合だけ，チェック座標が始点の位置を決定するために使用されます。

ノート：チェック座標は，ほとんど始点の座標に使用されません。

無効な座標については検討されません。座標を有効にしたり無効にしたりするには，プロパティウィンドウまたはマルチ編集ダイアログを使用します。

最も質の高い成分

2つ以上の有効な座標が合った場合，再計算はすべての使用可能なポイントのキー入力座標から，最も質の高い成分を使用します。3つの成分があります。

水平

標高

高度

ノート：これらの成分は同じ座標グループである必要はありません。

下の表は3つの成分の質を説明し，高いものから低いものへ順番をつけます。質の順は'質の優先順位'として参照されます。

プロパティウィンドウには，各成分の隣りに質の記号が表示されます。

座標タイプ

2つの座標が同じ質であった場合，再計算は座標のタイプから選択します。WGS-84 座標がグリッド/ローカル座標より優先して使用されます。


再計算 － 成分の質がどのように始点を決定するか

概要と詳細

2つ以上の可能な始点がある場合，再計算はもっとも質の高いポイントを始点として決定します。下の優先順位を使用します。

1.	基準点

2.	網平均

3.	測量

4.	マッピング

5.	不明

各成分の質が判定されます。ポイントの位置の質が各成分で違う場合，水平の質が最初に判定され，次に高度，次に標高が判定されます。

下の表は，優先順位の一部を表わしています。質の優先順位は，どの可能な始点が使用する始点になるかを決定します(質の優先順位は表に表示されているより下に続きがあります)。影になっているセルは，再計算が参照する質を表わします。

例えば，ポイントが下の成分の質を持つ場合

水平の質�基準点

高度の質�不明

標高の質�不明

このポイントは，下の成分の質を持つポイントより優先して始点として使用されます。

水平の質�測量

高度の質�測量

標高の質�マッピング

始点として使用したいポイント，または起点になる座標が基準点の質の成分を持つことを確認してください。

ノート：すべての成分が同じ質の考えられる始点が2つ以上ある場合，再計算はプロジェクトのはじめにあるポイントを使用します。


再計算－観測は現在の始点からどのように適用されるか

概要と詳細

再計算は，始点からの観測を観測のタイプに従って異なる方法で適用します。下のように適用します。

GPS 観測をWGS-84 楕円体に。

一般測量機観測とレーザー測距儀観測をローカル楕円体に�ただし，一般測量機による楕円体への補正観測(海面高補正)オプションは選択されません。

このオプションはプロジェクトプロパティダイアログの再計算タブにあります。詳しくは楕円体の標高補正.トピックをご覧ください。調整が実行される場合，すべての距離は楕円体上に変換されます。

デルタ標高−デルタ標高は再計算のはじめに既存の標高に適用されます。


再計算 － GPS 観測はどのように適用されるか

概要と詳細

GPS 観測はTrimble Geomatics Office プロジェクトに地表から地表へのベクトルとして保存されます。しかし，GPS ベクトルはアンテナの位相中心からアンテナの位相中心(APC-APC )が現場で観測されます。

インポート中，Trimble Geomatics Office はGPS ベクトルを各基線の端のGPS のアンテナ高を使用して，地表から地表へのベクトルに変換します。アンテナ高が編集された場合，地表から地表へのベクトルは自動的に更新されます。

ノート：基線解析は地表から地表へのベクトルを生成します。

再計算は次の処理を行ってGPS を使用して観測されたポイントの座標を決定します。

1.	始点の座標をWGS-84 の緯度，経度，高度(LLH )に変換します。

2.	3つの座標をWGS-84 地心座標(X，Y，Z )に変換します。

3.	始点のWGS-84 地心座標に地表から地表へのGPSベクトル(デルタX，デルタY，デルタZ )を適用します。これにより，観測されたポイントのWGS-84 地心座標が求められます。

ノート：適用されたGPS ベクトルは，プロジェクトで網平均パラメータが使用される場合，網平均されたベクトルです。基線が網平均で使用されていないとしてもです。

4.	観測されたポイントをWGS-84 の緯度，経度，高度に変換します。

5.	プロジェクトで選択されている座標系を使用して，各ポイントのWGS-84 の位置からその投影座標を求めます。プロジェクトに適用されているGPS サイトキャリブレーションも同様に使用します。

6.	結果として得られた座標がポイントの座標となります。


再計算－GPS 基線の方向

概要と詳細

標準で，再計算はすべてのリアルタイムキネマティック(RTK )のGPS 観測に，ベクトルが観測された方向(基準局から移動局)を適用します。

静止，および高速静止の後処理基線の方向は，基線解析中に起点となる観測によって決定されます。方向はプロジェクトに保存され，矢印がグラフィックウィンドウの基線上に表示されます。起点を決定するアルゴリズムは，ベクトルが高い質の位置を持つポイントから低い質の位置を持つポイントへ解析されることを保証します。再計算はベクトルにプロジェクトに保存された方向を適用します。

GPS ベクトルの方向を変更することができ，再計算はベクトルに反対の方向を適用します。

これを行うには，観測を選択し，編集/観測の方向を反転を選択します。この場合，ベクトルの起点にしようとしているポイントに既知の座標があることを確認してください。例えば，キー入力したWGS-84 緯度，経度，高度の座標です。ポイントに既知の座標がない場合，観測は適用されません。


再計算 －一般測量機観測，またはレーザー測距儀観測はどのように適用されるか
再計算－一般測量機観測､またはレーザー測距儀観測はどのように適用されるか

概要と詳細

一般測量機観測がインポートされる時

高度角は，湾曲と屈折が補正されます。

斜距離は，大気誤差が補正されます。(ppm 補正)

水平観測は，後視からの水平角に変換されます。

再計算は次の処理を行って一般測量機またはレーザー測距儀で観測されたポイントの位置を決定します。

1.	下の1つを行います。

観測がレーザー測距儀観測の場合，再計算は磁気偏差を観測した方位角に適用します。

観測が一般測量機観測の場合，再計算はプリズム定数を斜距離に適用します。

2.	観測された斜距離を水平の地表距離に変換します。

3.	一般測量機観測を楕円体上に変換(標高の補正)オプションがプロジェクトプロパティダイアログの再計算タブで選択されている場合，地表距離を楕円体距離に変換します。

4.	器械高をローカル高度に加算します。

5.	プロジェクトに定義されている座標系を使用して，始点の位置をローカルの緯度，経度，高度に変換します(観測は楕円体に沿って適用されます)。

6.	下のルールを使用して，後視方位角を決定します(一般測量機観測のみ)：

器械点の位置と後視ポイントだけが既知(つまり，キー入力された方位角はない)の場合，再計算は2点間の逆算から決定された後視方位角を使用します。

キー入力された方位角のみがあり，後視ポイントに座標がない場合，再計算はこれを後視方位角として使用します。

器械点と後視ポイントの両方の位置が既知で，キー入力された方位角がある場合，再計算は各方位角の質を決定し，下の表の優先順位で後視方位角として使用する方位角を決定します。

例えば，測量の質の器械点と後視ポイントが1組と，基準点の質のキー入力された方位角がある場合，キー入力された方位角が後視方位角として使用されます。

ノート：後視方位角の質を計算するには，器械点と後視ポイントの水平の質が検査され，最も低い質が選択されます。例えば，器械点は基準点の質で後視ポイントはマッピングの質の場合，後視方位角はマッピングの質になります。

タイプ	質
座標から	基準点
キー入力された方位角	基準点
座標から	測量
キー入力された方位角	測量
座標から	マッピング
キー入力された方位角	マッピング
ノート：器械点と後視ポイントから決定された方位角でなく，キー入力した方位角を使用して再計算したい場合，キー入力した方位角の質を高くしてください。そうすれば，優先順位が器械点と後視ポイントから決定された方位角より高くなります。

ヒント：キー入力された方位角の質は編集できます。

7.	水平角を後視方位角に適用し，グリッド方位角を決定します(一般測量機観測のみ)。

8.	磁気偏差を磁針方位角に適用し，グリッド方位角を決定します(レーザーのみ)。

9.	楕円体に沿った観測を適用し，観測したポイントのローカルの緯度，経度を決定します。

10.	観測されたポイントの標高を決定するには，ターゲットの高度を器械の高度から引いてデルタ高度を求めます。そしてこれを器械設置ポイントの標高に加算します。

プロジェクトに選択されている座標系を使用して，座標をローカルのグリッド座標に変換します。


再計算－デルタ標高はどのように適用されるか

デルタ標高は再計算中に適用されます。再計算は次の処理を行ってデルタ標高を求めます。

始点の標高が決定されます。

デルタ標高が始点に適用され，新しいポイントの標高を決定します。

再計算において，始点からのデルタ標高を求めるため，始点には必ずキー入力された標高が必要です。

水準路線観測の最初に必ず標高を入力し，デルタ標高が水準路線観測のはじめを基準にできるようにしてください。

例えば，下の図で，ポイントB，C，D の標高をデルタ標高観測を使用して決定するため，ポイントA にはキー入力された標高が必要です。A への観測に十分な情報がありA の標高を計算できる場合，デルタ標高は(キー入力された標高がない限り)まだ計算されません。


再計算 － 用例

概要と詳細

下の図は再計算がどのようにポイントの座標を決定するかの例です。ポイント'A'と'I'は両方とも基準点の質のポイント，他のポイントは測量の質です。

ポイント'A'と'I'は両方ともキー入力された座標を持ち，そこからの観測があるので，再計算は両方のポイントを可能な始点として考えます。ポイント'A'と'I'は同じ質なので(基準点の質のL，L，h )，再計算はプロジェクトに先にあるポイント'A'を始点として選択します。

再計算は始点からのすべての観測を使用して，最後に観測されたポイントまでの座標を決定します。従って，次のポイントは，ポイント'A'から座標を決定されています。'B'，'C'，'D'，'E'，'F'，'G'，'H'

始点(ポイント'A')からの観測はこれ以上ないので，再計算はポイント'I'を新しく始点として選択します。再計算はポイント'J'，'K'，'L'の座標をポイント'I'から決定します。

ポイント'I'からポイント'D'および'H'への観測があります。再計算は既にこれらのポイントの座標を決定しているので閉合が表示されます。閉合誤差がプロジェクトプロパティダイアログの再計算タブの許容値より大きい場合，警告フラグがグラフィックウィンドウの観測ポイント上に表示されます。閉合は再計算レポートに表示されます。

警告：ポイント'D'は'B'および'I'の観測から求めることができます。'B'からの観測はこれらの観測の質に関わらず，使用されます。これは，はじめに'D'の座標が'B'から決定されているためです。'I'からの観測を使用したい場合は，'B'から'D'の観測のステータスを�チェックとして有効�に変更します。


再計算－ポイントへの複数の観測と座標

概要と詳細

ポイントは，そのポイントへの複数の観測とキー入力された座標を持つことができます。プロジェクトプロパティダイアログの再計算タブで最適な観測を使用オプションが選択されている場合，ただひとつの観測，または座標が使用されてポイントの位置の成分(NE，e，h )を求めます。例えば，ポイントはそのポイントへの2つの観測を持ち，1つのキー入力された座標を持つかもしれません。キー入力された座標は観測より優先してポイントの座標を決定するために使用されます。再計算が使用しない他の観測，またはキー入力された座標は再計算レポートにレポートされます。

ノート：同じタイプの観測から平均を計算オプション(プロジェクトプロパティダイアログの再計算タブ)が選択されている場合，すべての観測はサイドショット(Sideshot )ポイントの座標成分の計算に関与できます。サイドショットポイントだけが平均されます。

ポイントへの複数の観測

ポイントへの座標の計算値を複数の観測を使用して決定するには(最適な観測を使用オプションが選択されているとき)，再計算は下の観測の優先順位を使用します。

1.	観測のステータス(有効，チェックとして有効，無効)

2.	観測の質

3.	観測のタイプ(GPS，一般測量機，レーザー，補正)

4.	精度

5.	プロジェクトに先にある観測


再計算－サイドショット(Sideshot )ポイントへの複数の観測

概要と詳細

観測(GPS または一般測量機)がTrimble Geomatics Office へ転送されたとき，ソフトウェアは各観測がサイドショット(Sideshot )かどうか，決定します。サイドショット(Sideshot )は下のようなポイントへの観測です。

そのポイントからの観測がない

そのポイントへの静止，または高速静止の観測がない

基準点でない

下の図は，サイドショット(Sideshot )ポイントが，2つの異なる状況でどのように発生するかを示します。

複数のサイドショット(Sideshot )観測グループ(プロジェクトプロパティダイアログの再計算タブ)の設定が，観測を使用してサイドショット(Sideshot )ポイントの位置を計算するかどうかを決定します。

ノート：再計算は複数のサイドショット(Sideshot )から標高を平均しません。


再計算－複数の観測と平均座標

概要と詳細

標準で，プロジェクトプロパティダイアログの再計算タブの同じタイプの観測から平均を計算は選択されていません。その結果，複数の観測は平均されません。

このオプションを選択する場合，Trimble Geomatics Office は，各観測から計算されたサイドショット(Sideshot )ポイントへの座標を平均します。

ノート：ポイントがトラバースポイントの場合，再計算は1つの観測，または座標だけを使用してポイントの位置を決定します。

サイドショット(Sideshot )ポイントの座標平均のルールは：

再計算は，同じタイプの観測だけを平均します。例えば，GPS 観測は一般測量機観測といっしょに平均できません。この場合，再計算はGPS観測を一般測量機観測より優先して使用します。

再計算は，観測から求められた座標だけを平均します。例えば，ポイントが2つの観測とキー入力された座標を持っている場合，再計算は観測を平均し，座標と質を決定します。そして，キー入力された座標と平均された座標を比較し，質の高い方の座標をポイントの位置として使用します。

ノート：1つ以上の観測が有効な場合，再計算はチェックとして有効な観測を平均位置の決定に使用しません。

ポイントの計算された位置を決定するには，再計算は各観測からポイントへの位置を計算します。各観測はその精度の値に従って，重み付けされます。精度が良いほど，観測は座標の平均値に影響を及ぼします。

GPS 観測について，再計算は精度フィールドを使用します。このフィールドを表示するには､

1.	GPS 観測を選択します。

2.	プロパティウィンドウを開きます。

3.	観測統計メニューボタン [image] をクリックします。

一般測量機観測に対しては､等しい重量が使用されます。

再計算は平均位置を許容値距離で定義される半径の円の中心として使用します。この距離は，プロジェクトプロパティダイアログの再計算タブで指定されています。座標成分が水平(北距，東距)の場合，再計算は水平許容値を使用します。座標成分が垂直(標高，または高度)の場合，再計算は垂直許容値を使用します。

ある位置が許容値で定義される円を超える場合，平均位置からもっとも遠い位置が棄却され，処理を繰り返します。下の図は，サイドショット(Sideshot )ポイントにはそのポイントへの3つの一般測量機観測があります。

観測3は許容値の円を超えます，従って観測3は次の処理では使用されません。

処理は，計算されたすべての位置が許容値の円内に入るまで，残りの観測で繰り返されます。下の図は，計算された平均グリッド座標がどのようにしてポイントの最終的な計算された座標になるかをあらわしています。

今度は，平均座標を決定するために使用されたすべての観測が，指定された許容値に入っています。従って，再計算はこれらの平均座標をポイントの計算された位置として使用します。

ノート：プロジェクトプロパティダイアログの再計算タブで許容値チェックのチェックボックスをクリアしている場合，同じタイプのすべての観測は許容値のチェックなしで平均されます。結果として，範囲外の観測は発見されません。


再計算－トラバースポイントへの複数の観測

概要と詳細

測量トラバースにおいて，トラバースポイントはそのポイントへの2つ以上の観測を持つかもしれません。これは，複数の観測と呼ばれます。

トラバースポイントへの複数の観測は，平均されません。これは下の図で表わされます。ポイント1はそのポイントへの2つの観測と，そのポイントからの1つの観測を持ちます。ポイント1 の位置を求めるために使用された観測は，ポイントへのはじめの観測です。


再計算－キー入力座標と観測のあるポイント

概要と詳細

ポイントに表示される位置は下から求められたと考えられます。

観測

キー入力された座標，例えば，インポートされたグリッド座標

ポイントにキー入力された座標と観測がある場合，再計算はキー入力された座標と観測の質を使用して，ポイントの位置を決定します。質が同じ場合，キー入力された座標を観測からの座標より優先して使用します。従って，ポイントの位置として観測を使用したい場合，ポイントへの観測をキー入力された座標より高い質に設定してください。

再計算は水平成分の質と垂直成分の質を分けて考えます。例えば，ポイントにインポートされたグリッド座標は測量の質の水平成分(北距，東距)とマッピングの質の標高成分を持つとします。同様に，ポイントへの観測があります。観測から求められた水平座標と垂直座標は測量の質です。

これは下のテーブルに要約されます。

.

影になっているセルは，ポイントの位置がどのように決定されるかを表わしています。水平成分の質は同じなので，再計算はキー入力された座標を観測より優先して使用します。インポートされた座標の垂直成分は観測より低いので，再計算は観測からの標高を使用します。

ポイントの最適な標高，または高度は，使用できるすべてのキー入力座標，およびポイントへの観測を使用して求められます。再計算が観測を使用してポイントの標高，または高度を計算する場合，もう1つの垂直成分を下の1つから計算します。

ジオイドモデルと/または高度調整

キー入力された座標

ジオイドモデルがプロジェクトに使用されている場合，プロジェクトプロパティダイアログの再計算タブのジオイドモデルの質は，ジオイドモデルから求められる標高，または高度の質を決定するために使用されます。この質はキー入力された座標と比較され，最適な質の標高成分，または高度成分が使用されます。

ノート：プロジェクトの座標系定義にキャリブレーションからの高度調整がある場合，求められた標高，または高度の質は測量の質です。


再計算 － 観測されたポイントの質はどのように決定されるか

概要と詳細

再計算は観測されたポイントの質を，そのポイントが観測された始点の質，またはポイントの位置を求めるために使用された観測の質から決定します。水平成分と垂直成分は別々に考えられます。

質の優先順位は：

1.	基準点

2.	測量

3.	マッピング

4.	不明

下の表は，観測の質が解のタイプや観測のタイプからどのように決定されるかを表わしています。

観測タイプ	観測に割り当てられる質
GPS フィックス	測量
GPS フロート	マッピング
GPS 単独測位	不明
一般測量機	測量
レーザー測距儀	マッピング
レベル	測量

ポイントに割り当てられた各成分(水平，標高，高度)の質は，下の質より低くなります。

観測がそこから行われたポイントの質

観測の質


リアルタイムキネマティック測量の単独測位の基準局位置

概要と詳細

Trimble Survey Controller で [image] キーを使用してリアルタイムキネマティック(RTK )の基準局をスタートし，Survey Controller (.dc)ファイルをTrimble Geomatics Office へ転送した場合，基準局の位置(および，基準局からのすべての移動局のポイント)は不明の質になります(すべての成分；水平，高度，標高について)。

Trimble Geomatics Office を使用してGPS サイトキャリブレーションを行う場合，水平成分と高度成分の質は変更されません。

GPS サイトキャリブレーションがポイントの質を改善した，と信頼できる場合，プロパティウィンドウを使用して基準局ポイントの質を変更します。基準局の質を高くすると，移動局のポイントの質を改善します。

ノート：標高成分の質は，プロジェクトの座標系定義に高度調整がある場合，測量になります。


再計算－Trimble Geomatics Office を使用して移動/調整されたポイント

概要と詳細

再計算は，下の方法でシフトされたポイントは移動しません：

座標移動

座標変換

標高調整

網平均

これらの操作の1つがポイントに適用されると，ポイントへの観測から求められた位置は使用されません。


再計算－プロジェクトの高度

概要と詳細

プロジェクトの高度はプロジェクト全般の設定で，高度のないポイントの計算において，おおよその高度として使用されます。高度のないポイントがプロジェクトの高度の値で更新されることはありません。下の場合の座標変換に使用されます。

プロジェクトの座標系が変更され，ヌルの高度がある

ポイントに高度がないため，標高補正が適用される

プロジェクトの高度フィールドはプロジェクトプロパティダイアログの座標系タブにあります。


再計算 － チェック観測

概要と詳細

Trimble Survey Controller はポイントへのチェック観測を保存することができます。.dc ファイルがTrimble Geomatics Office へインポートされる時に，これらのポイントがどのように扱われるか，以下に説明します。

キー入力基準点以外のポイントへのチェックのポイント

.dc ポイントがインポートされるとき，追加されたポイントへの計算された位置はポイントへの有効な観測を使用して求められます。チェック観測はインポートされますが，ポイントへの計算された位置を決定するためには使用されません。ただし，有効ステータスのあるポイントへの観測がない場合を除きます(再計算は常にチェックとして有効な観測の前に有効な観測を使用ます)。観測はチェックとして有効ステータスを与えられ，グラフィックウィンドウには点線で表示されます。観測のステータスを表示，編集するには，プロパティウィンドウ.の概要ページを使用します。ポイントの計算された位置と観測から決定された座標間の閉合較差が計算されます。これはインポート中に作成される再計算レポートにレポートされ，Reports  フォルダーの下の再計算フォルダーに保存されます。

ノート：保存されたポイントのチェック観測を保存する場合，前に収集されたポイントが削除され，チェック観測がインポートされ，新しいポイントが追加されます。観測のステータスはチェックとして有効として残り，ポイントの計算された位置は観測から求められます。


Trimble 3600/5600 GDM -概要

Trimble Geomatics Office とTrimble 3600/5600 機器のTrimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄ間でﾃﾞｰﾀの転送が可能です｡ﾄﾘﾝﾌﾞﾙ社は､機器がﾌｧｰﾑｳｪｱ632.11.00 以降を持つことをお勧めします｡

3600/5600 GDM ｼﾞｮﾌﾞ(*.job)ﾌｧｲﾙやｴﾘｱ(*.are)ﾌｧｲﾙからﾃﾞｰﾀをｲﾝﾎﾟｰﾄしたり､現在のTrimble Geomatics Office ﾌﾟﾛｼﾞｪｸﾄからｴﾘｱ(*.are)ﾌｧｲﾙへﾃﾞｰﾀをｴｸｽﾎﾟｰﾄしたりできます｡または､測量装置のｲﾝﾎﾟｰﾄｵﾌﾟｼｮﾝを使用してﾃﾞｰﾀを直接ｲﾝﾎﾟｰﾄしたりｴｸｽﾎﾟｰﾄしたりできます｡

以下の表は､Trimble Geomatics Office とTrimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄ間で転送可能なﾌｧｲﾙﾀｲﾌﾟを示しています｡

ｲﾝﾎﾟｰﾄ	ｴｸｽﾎﾟｰﾄ
.job−Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄからﾃﾞｰﾀ収集	なし
.are−座標ﾌｧｲﾙ	.are
なし	.pco −Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄへ
なし	.uds−ﾕｰｻﾞｰ定義のｼｰｹﾝｽ
Trimble Geomatics Office がｲﾝﾎﾟｰﾄされた3600/5600 GDM ﾌｧｲﾙを正しく解釈することを確実にするには､以下を行います｡

Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄは､ﾌﾟﾛｸﾞﾗﾑ番号がｵﾝになっていることを確認します｡

水平･垂直距離ではなく斜距離を保存するように､ﾌﾟﾛｸﾞﾗﾑ32 を設定します｡更に詳しい情報には､Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄの取扱説明書を参照してください｡

Trimble Geomatics Office でﾌﾟﾛｸﾞﾗﾑ23 と24 の観測を表示するには､Trimble 3600/5600 GDM ﾌﾟﾛｸﾞﾗﾑﾕｰｻﾞｰﾃｰﾌﾞﾙに標準ﾚｺｰﾄﾞ以外に水平角､高度角､斜距離ﾚｺｰﾄﾞもが含まれる必要があります｡ﾕｰｻﾞｰﾃｰﾌﾞﾙの修正方法に関する詳細は､Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄの取扱説明書を参照してください｡


ユーザー定義シーケンス(UDS)-概要

ﾕｰｻﾞｰ定義ｼｰｹﾝｽは､Trimble 3600/5600 機器のTrimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄを使用して､ﾌｨｰﾙﾄﾞでの測量ﾃﾞｰﾀの収集や保存方法を決定します｡それぞれのｼｰｹﾝｽは､ﾕｰｻﾞｰ定義ｼｰｹﾝｽ(*.uds)ﾌｧｲﾙに保存されます｡

UDS ﾌｧｲﾙは以下のﾚｺｰﾄﾞから構成されるべきです｡

2	機器ｽﾃｰｼｮﾝ
3	機器高	(任意)
62	後視ﾎﾟｲﾝﾄ
21	後視方位角
5	ﾎﾟｲﾝﾄ名
6	ﾀｰｹﾞｯﾄ高	(任意)
4	ｺｰﾄﾞ	(任意)
7	水平角
8	高度角
9	斜距離

ﾌｨｰﾙﾄﾞでﾕｰｻﾞｰ定義ｼｰｹﾝｽを使用するには､ｽﾀﾝﾄﾞｱﾛｰﾝﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨを使用してUDS ﾌｧｲﾙをTrimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄへ転送します｡(Trimble Geomatics Office のｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞは使用できません｡)更に詳しい情報には､ﾃﾞｰﾀ転送ﾍﾙﾌﾟを参照してください｡

測量ﾃﾞｰﾀを収集し保存したら､それをTrimble Geomatics Office に転送します｡

ﾉｰﾄ:予め定義されたUDS ﾌｧｲﾙは､Trimble Geomatics Office CD に含まれています｡

関連項目


Pコード(*.pco)ファイル

Pｺｰﾄﾞﾌｧｲﾙは､特徴と属性を定義する数値ｺｰﾄﾞと英数字の説明を含みます｡それらは､Trimble 3600/5600 機器のTrimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄで使用されます｡観測されたﾎﾟｲﾝﾄを素早く定義するために､ﾃﾞｰﾀの収集中にｺｰﾄﾞを入力できます｡例えば､Pｺｰﾄﾞﾌｧｲﾙがｺｰﾄﾞ｢201｣と説明｢木｣を含む場合には､ﾌｨｰﾙﾄﾞで｢201｣と入力すると､ｺﾝﾄﾛｰﾙﾕﾆｯﾄには｢木｣と表示されます｡

Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄにｴｸｽﾎﾟｰﾄされるPｺｰﾄﾞﾌｧｲﾙは以下を持つ必要があります｡

256 以下の数字を持つ数値ｺｰﾄﾞ

合計800文字以下の説明

Pｺｰﾄﾞﾌｧｲﾙを使用するには､Trimble の特徴･属性ｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨ内の特徴･属性ﾗｲﾌﾞﾗﾘからそれを作成してから､それをｺﾝﾄﾛｰﾙﾕﾆｯﾄに転送します｡

関連項目


エリア(*.are)ファイル

Trimble Geomatics Office は､Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄからのｴﾘｱﾃﾞｰﾀ(*.are ﾌｧｲﾙ)をｻﾎﾟｰﾄします｡

詳しくは､以下を参照してください｡

Trimble 3600/5600 GDM CU ﾌｧｲﾙのｲﾝﾎﾟｰﾄ方法

Trimble 3600/5600 GDM CU ﾌｫｰﾏｯﾄへのｴｸｽﾎﾟｰﾄ方法


ジョブ(*.job)ファイル

Trimble Geomatics Office は､Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄからのｼﾞｮﾌﾞﾃﾞｰﾀ(*.job ﾌｧｲﾙ)をｻﾎﾟｰﾄします｡

詳しくは､Trimble 3600/5600 GDM CU ﾌｧｲﾙのｲﾝﾎﾟｰﾄ方法を参照してください｡


ﾉｰﾄﾚｺｰﾄﾞのﾚﾎﾟｰﾄ

概要と詳細

Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄﾃﾞｰﾀﾍﾞｰｽからのﾉｰﾄをﾚﾎﾟｰﾄするには､ｶｽﾀﾑのﾃﾞｰﾀﾍﾞｰｽﾚﾎﾟｰﾄを作成します。ｶｽﾀﾑﾚﾎﾟｰﾄは､ﾃﾞｰﾀﾍﾞｰｽで定義された主要ﾚｺｰﾄﾞﾀｲﾌﾟやｸｴﾘｰで作用します。

ｶｽﾀﾑﾚﾎﾟｰﾄの作成には2段階あります。

選択ｾｯﾄの定義

ﾚﾎﾟｰﾄﾌｫｰﾏｯﾄの作成


選択ｾｯﾄの定義

ｸﾞﾗﾌｨｯｸでないﾚｺｰﾄﾞﾀｲﾌﾟ（例､ﾉｰﾄﾚｺｰﾄﾞ）を選択するには､

1.	以下の1つを行います。

.dcﾌｧｲﾙ選択ｾｯﾄを使用します。

選択/ｸｴﾘｰでを選びます。

2.	ﾚｺｰﾄﾞﾀｲﾌﾟを選択します。

ﾉｰﾄ: ﾃﾞｰﾀﾍﾞｰｽ全体を選択する場合､ﾚﾎﾟｰﾄはﾃﾞｰﾀﾍﾞｰｽ内のすべてのﾉｰﾄを含みます。


ﾚﾎﾟｰﾄﾌｫｰﾏｯﾄの作成

これを行うには､

1.	ﾚﾎﾟｰﾄ/追加のﾚﾎﾟｰﾄを選択します。追加のﾚﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが表示されます。ﾚﾎﾟｰﾄ一覧は現在有効なﾚﾎﾟｰﾄの一覧を示します。

2.	新規をｸﾘｯｸして新しいﾚﾎﾟｰﾄを作成します。｢ﾚﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが表示されます。

3.	名前ﾌｨｰﾙﾄﾞでは､ﾚﾎﾟｰﾄに対する名前を入力します。

4.	ﾌｨｰﾙﾄﾞのﾚﾎﾟｰﾄでは､ﾉｰﾄﾚｺｰﾄﾞを選択します。

5.	本文ﾌｫｰﾏｯﾄﾌｨｰﾙﾄﾞでは､以下の1つを行います。

[ﾉｰﾄ]を入力します。

ｼｮｰﾄｶｯﾄﾒﾆｭｰを使用して､ﾉｰﾄを選択します。

標準HTMLﾋﾞｭｰｱはﾚﾎﾟｰﾄを開いて表示します。ﾚﾎﾟｰﾄを印刷したり保存したりできます。


ﾎﾟｲﾝﾄ情報を持つﾉｰﾄﾚｺｰﾄﾞ（ﾌｨｰﾙﾄﾞで収集）のﾚﾎﾟｰﾄ

ﾉｰﾄﾚｺｰﾄﾞはTrimble Geomatics Office 内のﾎﾟｲﾝﾄに直接関係はありません。そのために､上に記された過程を使用してﾉｰﾄﾚｺｰﾄﾞとﾎﾟｲﾝﾄ情報（例､北､東､ﾉｰﾄ）を直接ｴｸｽﾎﾟｰﾄすることはできません。しかし､特徴ｺｰﾄﾞﾌｨｰﾙﾄﾞを通してﾉｰﾄをｴｸｽﾎﾟｰﾄすることができます。

これを行うには､

1.	DCｴﾃﾞｨﾀﾕｰﾃｨﾘﾃｨを使用して､.dcﾌｧｲﾙ内で､ﾉｰﾄが後に続くGPSﾍﾞｸﾄﾙﾚｺｰﾄﾞ(GPS VEC)を見つけます。

2.	こういったGPSﾍﾞｸﾄﾙﾚｺｰﾄﾞﾌｨｰﾙﾄﾞにおいては､ｺｰﾄﾞﾌｨｰﾙﾄﾞに進み､現在のｺｰﾄﾞの後にﾀﾞｯｼｭ記号（ － ）を入れてからﾉｰﾄ情報を続けます。例､｢木 －松｣

ﾚｺｰﾄﾞがｲﾝﾎﾟｰﾄされる時には､ﾉｰﾄﾚｺｰﾄﾞが特徴ｺｰﾄﾞﾌｨｰﾙﾄﾞの終わりに追加されます。ﾉｰﾄはその時にﾎﾟｲﾝﾄに関連付けられ､ﾚﾎﾟｰﾄすることができるようになります。

ﾎﾟｲﾝﾄ､北距､東距､特徴ｺｰﾄﾞ

ﾉｰﾄ:時によっては､GPSﾍﾞｸﾄﾙﾚｺｰﾄﾞﾌｨｰﾙﾄﾞの後ろにはﾀｲﾑｽﾀﾝﾌﾟが､そしてﾉｰﾄﾚｺｰﾄﾞが続きます。この場合､ﾀｲﾑｽﾀﾝﾌﾟはﾎﾟｲﾝﾄにではなく特徴ｺｰﾄﾞに関連しています。ﾀｲﾑｽﾀﾝﾌﾟﾚｺｰﾄﾞを削除する必要があります。


ｶｽﾀﾑﾎﾟｲﾝﾄﾚﾎﾟｰﾄの作成

概要と詳細

Trimble Geomatics Officeﾃﾞｰﾀﾍﾞｰｽからﾎﾟｲﾝﾄﾚｺｰﾄﾞをﾚﾎﾟｰﾄするには､ｶｽﾀﾑﾃﾞｰﾀﾍﾞｰｽﾚﾎﾟｰﾄを作成します。ｶｽﾀﾑﾚﾎﾟｰﾄは､ﾃﾞｰﾀﾍﾞｰｽで定義された主要ﾚｺｰﾄﾞﾀｲﾌﾟやｸｴﾘｰで作用します。


ｶｽﾀﾑﾃﾞｰﾀﾍﾞｰｽﾚﾎﾟｰﾄの作成

1.	ﾚﾎﾟｰﾄ/追加のﾚﾎﾟｰﾄを選択します。追加のﾚﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが表示されます。ﾚﾎﾟｰﾄ一覧は現在有効なﾚﾎﾟｰﾄの一覧を示します。

2.	新規をｸﾘｯｸして新しいﾚﾎﾟｰﾄﾌｫｰﾏｯﾄを作成します。｢ﾚﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが表示されます。

3.	名前ﾌｨｰﾙﾄﾞでは､ﾚﾎﾟｰﾄに対する名前を入力します。標準では､ﾎﾟｲﾝﾄを記録する項目はﾌｨｰﾙﾄﾞでのﾚﾎﾟｰﾄに現れます。

4.	ﾌｫｰﾏｯﾄを自動的に記入をｸﾘｯｸすると､Trimble Geomatics Office はﾍｯﾀﾞｰﾌｫｰﾏｯﾄと本文ﾌｫｰﾏｯﾄﾌｨｰﾙﾄﾞを記入します。こういったﾌｫｰﾏｯﾄを編集することができます。

ﾋﾝﾄ:ﾍｯﾀﾞｰﾌｫｰﾏｯﾄと本文ﾌｫｰﾏｯﾄﾌｨｰﾙﾄﾞを右ｸﾘｯｸして､ﾌｨｰﾙﾄﾞを選択し､一覧から利用できるﾌｨｰﾙﾄﾞｺｰﾄﾞを選択します。

5.	OKをｸﾘｯｸします。

標準HTMLﾋﾞｭｰｱはﾚﾎﾟｰﾄを開いて表示します。ﾚﾎﾟｰﾄを印刷したり保存したりできます。


ﾌﾟﾛｼﾞｪｸﾄの投影でｿﾞｰﾝの変更

概要と詳細

ﾉｰﾄ: ｿﾞｰﾝは座標系ﾃﾞｰﾀﾍﾞｰｽ内でなければなりません。

1.	ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	座標系ﾀﾌﾞを選択します。

3.	座標系設定ｸﾞﾙｰﾌﾟで､変更をｸﾘｯｸします。｢座標系の選択｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	｢新しい座標系｣ｵﾌﾟｼｮﾝを選択してから､次へをｸﾘｯｸします。｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	｢座標系とｿﾞｰﾝ｣ｵﾌﾟｼｮﾝを選択してから､次へをｸﾘｯｸします。

6.	｢座標系ｿﾞｰﾝ｣ｸﾞﾙｰﾌﾟで､必要とするｿﾞｰﾝを含む座標系を反転表示します。

7.	ｿﾞｰﾝｸﾞﾙｰﾌﾟで､必要とするｿﾞｰﾝを選択してから､次へをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

8.	以下の1つを行ってください。

ﾌﾟﾛｼﾞｪｸﾄに対して必要であるｼﾞｵｲﾄﾞﾓﾃﾞﾙを選択します。

｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙなし｣をｸﾘｯｸします。

9.	終了をｸﾘｯｸします。

座標系はﾃﾞｰﾀﾍﾞｰｽに適用されます。ﾃﾞｰﾀﾍﾞｰｽ内に現存するﾎﾟｲﾝﾄのすべては新しい座標系に変換されます。

ﾎﾟｲﾝﾄﾎﾟｼﾞｼｮﾝを持つか､ﾌﾟﾛｼﾞｪｸﾄにﾇﾙ標高を持つ座標を入力したために投影標高が定義されていない場合には､座標系選択は失敗に終わります。これは､Trimble Geomatics Office はおおよその標高なしでは現存するﾎﾟｲﾝﾄをある座標系からその他に変換することはできないためです。


特徴･属性ﾗｲﾌﾞﾗﾘをTrimble Survey Controller にｴｸｽﾎﾟｰﾄ
背景地図ﾌｧｲﾙをTrimble Survey Controller にｴｸｽﾎﾟｰﾄ

概要と詳細

1.	以下の1つを行います。

ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。

ｴｸｽﾎﾟｰﾄﾂｰﾙをｸﾘｯｸします。

｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢特徴･属性ﾗｲﾌﾞﾗﾘをSurvey Controller(*.fcl)へ｣ｵﾌﾟｼｮﾝを選択します。｢特徴･属性ﾗｲﾌﾞﾗﾘの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	検索をｸﾘｯｸして､ｴｸｽﾎﾟｰﾄしたい.fclﾌｧｲﾙの位置を探し出します。

4.	｢属性のｴｸｽﾎﾟｰﾄ｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにして､特徴･属性ﾗｲﾌﾞﾗﾘに含まれる属性定義をｴｸｽﾎﾟｰﾄします。このｵﾌﾟｼｮﾝは､Trimble Survey Controller で属性が利用できるようにします。ﾁｪｯｸﾎﾞｯｸｽがｵﾌにされる場合には､.fclﾌｧｲﾙ内で定義された属性のすべてはｴｸｽﾎﾟｰﾄされません。

ﾉｰﾄ:ｺﾝﾄﾛｰﾙｺｰﾄﾞもｴｸｽﾎﾟｰﾄされます。

5.	OKをｸﾘｯｸすると､｢ﾃﾞｰﾀ転送､名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

6.	装置（Trimble Survey Controller を使用）がｺﾝﾋﾟｭｰﾀｰに接続されているかどうかを確認します。

7.	Survey Controller装置を選択して､開くをｸﾘｯｸします。接続ﾀﾞｲｱﾛｸﾞが現れます。

接続が行われると､保存ﾀﾞｲｱﾛｸﾞが現れます。

8.	以下の1つを行います。

ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller のﾒｲﾝﾒﾓﾘのﾗｲﾌﾞﾗﾘに保存します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞのﾗｲﾌﾞﾗﾘに保存したい場合には､PCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

ﾉｰﾄ:装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

9.	開くをｸﾘｯｸします。選択した場所は読み込まれます。ﾃﾞｨﾚｸﾄﾘ内のすべての特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙが表示されます。特徴･属性ﾗｲﾌﾞﾗﾘの内部名がﾌｧｲﾙ名ﾌｨｰﾙﾄﾞに表示されます。

10.	必要に応じてTrimble Survey Controller 内のﾌｧｲﾙ名を変更するために､ﾌｧｲﾙ名ﾌｨｰﾙﾄﾞを編集します。最初からｺﾝﾋﾟｭｰﾀｰにあったﾌｧｲﾙの名前は変更されません。

11.	保存をｸﾘｯｸします。読込みﾀﾞｲｱﾛｸﾞが現れます。進行状況ﾊﾞｰが転送の進行状況を表示します。

転送が完了すると､読込みﾀﾞｲｱﾛｸﾞが消えて､装置への接続は切断されます。

ﾗｲﾌﾞﾗﾘは転送されました。


GISﾌｫｰﾏｯﾄへのｴｸｽﾎﾟｰﾄ

概要と詳細

1.	以下の1つを行います。

ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。.

標準ﾂｰﾙﾊﾞｰのｴｸｽﾎﾟｰﾄﾂｰﾙをｸﾘｯｸします。

ｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが現れます。

2.	GISﾀﾌﾞで､必要なﾌｫｰﾏｯﾄを選択します。

3.	ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄに対するｵﾌﾟｼｮﾝの設定を変更するには､ｵﾌﾟｼｮﾝをｸﾘｯｸします。これによって､ｴｸｽﾎﾟｰﾄしようとしているGISﾌｫｰﾏｯﾄに対して適切なｵﾌﾟｼｮﾝを設定することができます。

4.	OKをｸﾘｯｸします。ﾌｧｲﾙ名ﾀﾞｲｱﾛｸﾞが現れます。

5.	新しいﾌｧｲﾙに対する名前を特定し､新しいﾌｧｲﾙを作成するために保存をｸﾘｯｸします。


To create a Combined Datum Grid (.cdg)file to transfer to Trimble Survey Controller
Trimble Survey Controller に転送するための結合測地ｸﾞﾘｯﾄﾞ(.cdg)ﾌｧｲﾙの作成

概要と詳細

ﾉｰﾄ:新しい結合測地ｸﾞﾘｯﾄﾞを作成するには､ﾌﾟﾛｼﾞｪｸﾄで現在使用されている測地ｸﾞﾘｯﾄﾞﾌｧｲﾙしか使用できません。しかし､どんな結合測地ｸﾞﾘｯﾄﾞもｴｸｽﾎﾟｰﾄすることができます。結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙはTrimble Survey Controller のﾊﾞｰｼﾞｮﾝ7.00以降にしか転送できません。

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢測地ｸﾞﾘｯﾄﾞをSurvey Controller (*.cdg)へ｣ｵﾌﾟｼｮﾝを選択してからOKをｸﾘｯｸします。｢測地ｸﾞﾘｯﾄﾞのｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢Trimble Survey Controllerへのｴｸｽﾎﾟｰﾄのための結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ｵﾌﾟｼｮﾝを選択します。｢結合測地ｸﾞﾘｯﾄﾞの作成｣ﾀﾞｲｱﾛｸﾞが現れます。

地球上の黄色の枠が､緯度と経度のｸﾞﾘｯﾄﾞﾌｧｲﾙに含まれるｴﾘｱを定義します。これは､｢結合測地ｸﾞﾘｯﾄﾞの作成｣ﾀﾞｲｱﾛｸﾞの右側に特定されます。

4.	ﾌｧｲﾙのｻｲｽﾞを減らすには､｢結合測地ｸﾞﾘｯﾄﾞの作成｣ﾀﾞｲｱﾛｸﾞ左側の｢選択｣ﾂｰﾙを使用します。結合測地ｸﾞﾘｯﾄﾞの作成を希望するｴﾘｱに（黄色枠の中）､黒い選択枠をﾄﾞﾗｯｸﾞします。

ﾌｧｲﾙｻｲｽﾞはｻｲｽﾞを示し､緯度と経度限界は作成される結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙの範囲を示します。

5.	Survey Controller名ﾌｨｰﾙﾄﾞは､Trimble Survey Controllerｼﾞｮﾌﾞで使用されるｻﾌﾞｸﾞﾘｯﾄﾞ結合測地ｸﾞﾘｯﾄﾞの名前を表示します。Trimble Survey Controllerが既に同じ名前の測地ｸﾞﾘｯﾄﾞを使用する場合には､接頭辞か接尾辞を追加します。名前は､元来の測地ｸﾞﾘｯﾄﾞの名前を含まなくてはなりません。

ﾉｰﾄ:Survey Controller (*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中､Trimble Geomatics Office は､ﾌｨｰﾙﾄﾞで使用された.cdgﾌｧｲﾙの名前がTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに対して定義された測地ｸﾞﾘｯﾄﾞに一致するかどうかを確認するために､Survey Controller名を使用します。その名前が元来の測地ｸﾞﾘｯﾄﾞ名と一致しない場合には､その測地ｸﾞﾘｯﾄﾞは認識されません。

6.	OKをｸﾘｯｸします。.

｢ﾌｧｲﾙ名｣ﾀﾞｲｱﾛｸﾞが現れます。標準ﾌｧｲﾙ名は､測地ｸﾞﾘｯﾄﾞ名の最初の6文字です。これは､Trimble Survey Controllerで使用される名前ではなくﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\共通ﾌｧｲﾙ\Trimble\GeoData辞書に保管されている.cdgﾌｧｲﾙの名前です。

7.	ﾌｧｲﾙの別の名前を特定するには､｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞを編集するためにｷｰﾎﾞｰﾄﾞから入力してから､保存をｸﾘｯｸします。｢ﾃﾞｰﾀ転送､名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

8.	｢Survey Controller装置｣を選択してから､開くをｸﾘｯｸします。接続ﾀﾞｲｱﾛｸﾞが現れます。接続が行われると､保存ﾀﾞｲｱﾛｸﾞが現れます。

9.	以下の1つを行います。

ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller のﾒｲﾝﾒﾓﾘのﾌｧｲﾙに保存します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞにﾌｧｲﾙを保存したい場合には､PCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

ﾉｰﾄ:お手持ちのTrimble装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

10.	開くをｸﾘｯｸします。

選択したﾃﾞｨﾚｸﾄﾘが読み込まれます。ﾃﾞｨﾚｸﾄﾘ内のすべての結合測地ｸﾞﾘｯﾄﾞﾌｧｲﾙは表示されます。｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞは利用できません。それは､Trimble Survey Controllerに示される結合測地ｸﾞﾘｯﾄﾞの名前を表示します。

11.	保存をｸﾘｯｸします。｢読込み｣ﾀﾞｲｱﾛｸﾞが現れます。進行状況ﾊﾞｰが転送の進行状況を表示します。転送が完了すると､｢読込み｣ﾀﾞｲｱﾛｸﾞが消えて､装置への接続は切断されます。

ここでTrimble Survey Controller 内のﾌｧｲﾙを使用することができます。


Trimble Survey Controller へのｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞ(.ggf)ﾌｧｲﾙのｻﾌﾞｸﾞﾘｯﾄﾞ作成と転送

概要と詳細

ﾉｰﾄ:ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙはTrimble Survey Controller のﾊﾞｰｼﾞｮﾝ6.00以降にしか転送できません。

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢ｼﾞｵｲﾄﾞﾌｧｲﾙをSurvey Controller(*.ggf)へ｣ｵﾌﾟｼｮﾝを選択し､OKをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙのｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	新しいｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙを作成するには､｢Trimble Survey Controllerへのｴｸｽﾎﾟｰﾄのためにｼﾞｵｲﾄﾞﾓﾃﾞﾙのｻﾌﾞｸﾞﾘｯﾄを作成｣ｵﾌﾟｼｮﾝを選択してからOKをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾉｰﾄ:｢現存するｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙをSurvey Controllerにｴｸｽﾎﾟｰﾄ｣ｵﾌﾟｼｮﾝを選択して､現存するこのﾀｲﾌﾟのﾌｧｲﾙをｴｸｽﾎﾟｰﾄします。

地球上の黄色の枠が､ｼﾞｵｲﾄﾞﾓﾃﾞﾙに含まれるｴﾘｱを定義します。ｼﾞｵｲﾄﾞﾓﾃﾞﾙとｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙは､｢ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ﾀﾞｲｱﾛｸﾞの右側に特定されます。ｼﾞｵｲﾄﾞﾓﾃﾞﾙが世界を含む場合には､黄色の枠は見えません。

4.	ﾌｧｲﾙのｻｲｽﾞを減らすには､｢ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ﾀﾞｲｱﾛｸﾞの左側の｢選択｣ﾂｰﾙを使用します。ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成を希望するｴﾘｱに（黄色枠の中）､黒い選択枠をﾄﾞﾗｯｸﾞします。

ﾌｧｲﾙｻｲｽﾞはｻｲｽﾞを示し､緯度と経度限界は作成されるｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの範囲を示します。

5.	Survey Controller名ﾌｨｰﾙﾄﾞは､Trimble Survey Controllerｼﾞｮﾌﾞで使用されるｻﾌﾞｸﾞﾘｯﾄﾞｼﾞｵｲﾄﾞﾓﾃﾞﾙの名前を表示します。Survey Controllerが既に同じ名前のｼﾞｵｲﾄﾞﾓﾃﾞﾙを使用する場合には､接頭辞か接尾辞を名前に追加します。名前は､元来のｼﾞｵｲﾄﾞﾓﾃﾞﾙの名前を含まなくてはなりません。

ﾉｰﾄ:Survey Controller (*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中､Trimble Geomatics Office は､ﾌｨｰﾙﾄﾞで使用された.ggfﾌｧｲﾙの名前がTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに対して定義されたｼﾞｵｲﾄﾞﾓﾃﾞﾙに一致するかどうかを確認するために､名前ﾌｨｰﾙﾄﾞを使用します。その名前が元来のｼﾞｵｲﾄﾞﾓﾃﾞﾙ名を含むことを確認してください｡そうでない場合には､そのｼﾞｵｲﾄﾞﾓﾃﾞﾙは認識されません。

6.	OKをｸﾘｯｸします。.

｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。標準ﾌｧｲﾙ名はｼﾞｵｲﾄﾞﾓﾃﾞﾙ名の最初の6文字です。これは､Trimble Survey Controllerで使用される名前ではありません。それは､ﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\共通ﾌｧｲﾙ\Trimble\GeoData辞書に保管されているｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの名前です。

7.	ﾌｧｲﾙの別の名前を特定するには､｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞをｷｰﾎﾞｰﾄﾞを使用して編集してから､保存をｸﾘｯｸします。｢ﾃﾞｰﾀ転送､名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

8.	｢Survey Controller装置｣を選択してから､開くをｸﾘｯｸします。接続ﾀﾞｲｱﾛｸﾞが現れます。接続が行われると､保存ﾀﾞｲｱﾛｸﾞが現れます。

9.	以下の1つを行います。

ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller のﾒｲﾝﾒﾓﾘのﾌｧｲﾙに保存します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞにﾌｧｲﾙを保存したい場合には､PCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

ﾉｰﾄ:お手持ちのTrimble装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

10.	開くをｸﾘｯｸします。

選択したﾃﾞｨﾚｸﾄﾘは読み込まれます。ﾃﾞｨﾚｸﾄﾘ内のすべてのｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙが表示されます。｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞは､Survey Controllerｿﾌﾄｳｪｱに示されるｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞの名前を表示します。この名前は､このﾌｧｲﾙを使用して.dcﾌｧｲﾙをTrimble Geomatics Office に転送する時に､ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞ名と一致させるために使用されます。

11.	保存をｸﾘｯｸします。｢転送中｣ﾀﾞｲｱﾛｸﾞが現れます。進行状況ﾊﾞｰが転送の進行状況を表示します。転送が完了すると､｢転送中｣ﾀﾞｲｱﾛｸﾞが消えて､ﾃﾞｰﾀｺﾚｸﾀｰへの接続は切断されます。

ここでTrimble Survey Controller 内のﾌｧｲﾙを使用することができます。

ﾉｰﾄ:ｼﾞｵｲﾄﾞﾓﾃﾞﾙﾌｧｲﾙをｻﾌﾞｸﾞﾘｯﾄﾞするのにTrimble ｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰ�ﾕｰﾃｨﾘﾃｨを使用することもできます。ｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰはTrimble Geomatics Office のｲﾝｽﾄｰﾙ時のｶｽﾀﾑｵﾌﾟｼｮﾝの1つです。

ﾉｰﾄ:Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.60 から/へﾃﾞｰﾀを転送する場合には､ﾊﾞｰｼﾞｮﾝ7.50.dcﾌｧｲﾙﾌｫｰﾏｯﾄを使用します。


TDS Survey Pro CE ｿﾌﾄｳｪｱへのｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞ(.ggf)ﾌｧｲﾙのｻﾌﾞｸﾞﾘｯﾄﾞ作成と転送

概要と詳細

ﾉｰﾄ:ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙはTDS Survey Pro CE ｿﾌﾄｳｪｱのﾊﾞｰｼﾞｮﾝ4以降にしか転送できません。

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢ｼﾞｵｲﾄﾞﾌｧｲﾙをTDS Survey Pro CE (*.ggf)へ｣ｵﾌﾟｼｮﾝを選択し､OKをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙのｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	新しいｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙを作成するには､｢ｴｸｽﾎﾟｰﾄのためにｼﾞｵｲﾄﾞﾓﾃﾞﾙのｻﾌﾞｸﾞﾘｯﾄを作成｣ｵﾌﾟｼｮﾝを選択してからOKをｸﾘｯｸします。｢ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾉｰﾄ:｢現存するｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙをｴｸｽﾎﾟｰﾄ｣ｵﾌﾟｼｮﾝを選択して､現存するこのﾀｲﾌﾟのﾌｧｲﾙをｴｸｽﾎﾟｰﾄします。

地球上の黄色の枠が､ｼﾞｵｲﾄﾞﾓﾃﾞﾙに含まれるｴﾘｱを定義します。ｼﾞｵｲﾄﾞﾓﾃﾞﾙとｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙは､｢ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ﾀﾞｲｱﾛｸﾞの右側で特定されます。ｼﾞｵｲﾄﾞﾓﾃﾞﾙが世界を含む場合には､黄色の枠は見えません。

4.	ﾌｧｲﾙのｻｲｽﾞを減らすには､｢ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成｣ﾀﾞｲｱﾛｸﾞの左側の｢選択｣ﾂｰﾙを使用します。ｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの作成を希望するｴﾘｱに（黄色枠の中）､黒い選択枠をﾄﾞﾗｯｸﾞします。

ﾌｧｲﾙｻｲｽﾞはｻｲｽﾞを示し､緯度と経度限界は作成されるｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの範囲を示します。

5.	名前ﾌｨｰﾙﾄﾞは､使用されたｻﾌﾞｸﾞﾘｯﾄﾞｼﾞｵｲﾄﾞﾓﾃﾞﾙの名前を表示します。

ﾉｰﾄ:ﾌｧｲﾙのｲﾝﾎﾟｰﾄ中､Trimble Geomatics Office は名前ﾌｨｰﾙﾄﾞを使用して､ﾌｨｰﾙﾄﾞで使用された.ggfﾌｧｲﾙの名前がTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに対して定義されたｼﾞｵｲﾄﾞﾓﾃﾞﾙに一致するかどうかを確認します。その名前が元来のｼﾞｵｲﾄﾞﾓﾃﾞﾙ名を含むことを確認してください｡そうでない場合には､そのｼﾞｵｲﾄﾞﾓﾃﾞﾙは認識されません。

6.	OKをｸﾘｯｸします。.

｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。標準ﾌｧｲﾙ名はｼﾞｵｲﾄﾞﾓﾃﾞﾙ名の最初の6文字です。それは､ﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\共通ﾌｧｲﾙ\Trimble\GeoData辞書に保管されているｼﾞｵｲﾄﾞｸﾞﾘｯﾄﾞﾌｧｲﾙの名前です。

7.	ﾌｧｲﾙの別の名前を特定するには､｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞをｷｰﾎﾞｰﾄﾞを使用して編集してから､保存をｸﾘｯｸします。｢ﾃﾞｰﾀ転送､名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

8.	｢TDS Survey Pro CE 装置｣を選択してから､開くをｸﾘｯｸします。接続ﾀﾞｲｱﾛｸﾞが現れます。接続が行われると､保存ﾀﾞｲｱﾛｸﾞが現れます。

9.	ﾌｧｲﾙをTDS Survey Pro CE 装置に転送します｡

ﾌｧｲﾙをTDS Survey Pro CE ｿﾌﾄｳｪｱで使用できるようになりました｡

ﾉｰﾄ:ｼﾞｵｲﾄﾞﾓﾃﾞﾙﾌｧｲﾙをｻﾌﾞｸﾞﾘｯﾄﾞするのにｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰﾕｰﾃｨﾘﾃｨを使用することもできます。ｸﾞﾘｯﾄﾞﾌｧｸﾄﾘｰはTrimble Geomatics Office のｲﾝｽﾄｰﾙ時のｶｽﾀﾑｵﾌﾟｼｮﾝの1つです。


TRIMMAPｿﾌﾄｳｪｱからのﾃﾞ－ﾀを使用
TRIMMAPｿﾌﾄｳｪｱからﾃﾞｰﾀを使用

TRIMMAPｿﾌﾄｳｪｱで作成したｼﾞｮﾌﾞからTrimble Geomatics Office へﾃﾞｰﾀをｲﾝﾎﾟｰﾄします。

1.	TRIMMAPｿﾌﾄｳｪｱから､Trimble Geomatics Office で処理したいｼﾞｮﾌﾞを開きます。

2.	ﾂｰﾙ/ｲﾝﾎﾟｰﾄ･ｴｸｽﾎﾟｰﾄ/ｸﾞﾗﾌｨｯｸｲﾝﾀｰﾌｪｰｽを選択します。ｸﾞﾗﾌｨｯｸｲﾝﾀｰﾌｪｰｽﾒﾆｭｰが現れます。

3.	ｸﾞﾗﾌｨｯｸｲﾝﾀｰﾌｪｰｽ/ﾌｧｲﾙの作成を選択します。

4.	ｼﾞｮﾌﾞ名と出力ﾌｧｲﾙ名を入力します。

ﾉｰﾄ:出力ﾌｧｲﾙ名ﾌｨｰﾙﾄﾞでは､作成されるﾌｧｲﾙの場所と名前を特定し､.tgf拡張子が提供されたことを確認してください。例､C:\Temp\Topo_pts.tgf

5.	Trimble Geomatics Office で､ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

6.	CAD /ASCII ﾀﾌﾞで､TRIMMAPｸﾞﾗﾌｨｯｸｽﾌｧｲﾙｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢ﾌｧｲﾙの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

7.	.tgfﾌｧｲﾙを含むﾌｫﾙﾀﾞへと導き､開くをｸﾘｯｸします。

ﾌｧｲﾙはTrimble Geomatics Office にｲﾝﾎﾟｰﾄされました。


新しいｸｴﾘ－の作成
新しいｸｴﾘｰの作成

警告は､ﾄﾘﾝﾌﾞﾙ社が製造販売の独占権を持つTrimble Geomatics Office の使用によってのみ､このﾃﾞｰﾀﾍﾞｰｽの使用や変更をｻﾎﾟｰﾄします。ﾄﾘﾝﾌﾞﾙ社は､その他のｿﾌﾄｳｪｱｱﾌﾟﾘｹｰｼｮﾝを介してのこのﾃﾞｰﾀﾍﾞｰｽの使用や変更､性能の保証をｻﾎﾟｰﾄすることも許可することもありません。ﾄﾘﾝﾌﾞﾙ社は､その他のｿﾌﾄｳｪｱｱﾌﾟﾘｹｰｼｮﾝとは適合しないようにこのﾃﾞｰﾀﾍﾞｰｽのﾌｫｰﾏｯﾄを変更するかもしれません。

概要と詳細

ﾉｰﾄ:ｶｽﾀﾑｸｴﾘｰを定義するには､Microsoft Access 2000（またはそれ以降）ｿﾌﾄｳｪｱが必要です。

この例では､ｾﾞﾛの標高値を持つﾃﾞｰﾀﾍﾞｰｽﾎﾟｲﾝﾄのすべてを選択するｸｴﾘｰを作成します。

1.	Microsoft Accessで､ｸｴﾘｰを追加しようとしているTrimble Geomatics Office ﾃﾝﾌﾟﾚｰﾄ（またはﾌﾟﾛｼﾞｪｸﾄ）ﾃﾞｰﾀﾍﾞｰｽを開きます。これは､ﾃﾝﾌﾟﾚｰﾄやﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞ（.mdb）に含まれます。

2.	ﾒｲﾝｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳでｸｴﾘｰﾀﾌﾞを選択してから､新しいｸｴﾘｰを作成するために新規をｸﾘｯｸします。

ﾋﾝﾄ:｢ｸｴﾘｰｳｨｻﾞｰﾄﾞ｣ｵﾌﾟｼｮﾝではなく｢ﾃﾞｻﾞｲﾝの表示｣ｵﾌﾟｼｮﾝを選びます。

3.	｢ﾃｰﾌﾞﾙの表示｣ﾀﾞｲｱﾛｸﾞで､ﾎﾟｲﾝﾄｴﾝﾃｨﾃｨを選択したいためと､それはすべてこのﾃｰﾌﾞﾙに保管されていることから､ﾎﾟｲﾝﾄﾃｰﾌﾞﾙを選択します。

4.	ﾀﾞｲｱﾛｸﾞを閉じる前に､追加をｸﾘｯｸします。

｢ｸｴﾘｰ｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	ｸｴﾘｰ定義の最初の列を｢ﾎﾟｲﾝﾄﾃｰﾌﾞﾙ全体｣と設定します。ｸｴﾘｰﾀﾞｲｱﾛｸﾞの最上ｾｸｼｮﾝにあるﾎﾟｲﾝﾄﾃｰﾌﾞﾙから*識別子をﾄﾞﾗｯｸﾞしてﾄﾞﾛｯﾌﾟするか､ﾌｨｰﾙﾄﾞﾎﾞｯｸｽからﾎﾟｲﾝﾄ*を選択することで､これを行うことができます。

ﾉｰﾄ:｢表示｣ﾁｪｯｸﾎﾞｯｸｽが標準として選択されます。複数のｴﾝﾃｨﾃｨがｸｴﾘｰによって選択されるのでなければ､一般的にはﾃｰﾌﾞﾙ全体を元に戻すことが好まれます。この方法では､ｸｴﾘｰはその他の目的にも使用されることができます。（ﾚﾎﾟｰﾄなど）

6.	ﾌｨｰﾙﾄﾞ設定の第2の列を標高（標高ﾌｨｰﾙﾄﾞ識別子）と設定します。

この列の判断基準ﾌｨｰﾙﾄﾞに =0 と入力します。これは､ｾﾞﾛ標高値に対するﾁｪｯｸを設定します。

7.	このｸｴﾘｰの機能性を試験するには､ﾃﾞｰﾀｼｰﾄ表示をﾁｪｯｸします。ﾃﾞｰﾀﾍﾞｰｽ内のｾﾞﾛ高度のﾎﾟｲﾝﾄすべてはそのﾃｰﾌﾞﾙに一覧として示されます。

8.	新しいｸｴﾘｰを保存するには､それを閉じてから､接頭辞｢選択_｣を付く名前を付けます。例えば､それを｢選択_ｾﾞﾛ標高のﾎﾟｲﾝﾄ｣と名づけます。

ﾉｰﾄ:ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ選択ﾂｰﾙにｸｴﾘｰを追加するには､分類ﾂｰﾙとしては接頭辞｢分類SS_｣を使用し､測量ﾃﾞｰﾀ用ﾌｨﾙﾀｰﾂｰﾙとしては｢測量ﾌｨﾙﾀｰSS_｣を､CADﾃﾞｰﾀ用ﾌｨﾙﾀｰﾂｰﾙとしては｢平面図SS_｣を使用します。ｶｽﾀﾑﾚﾎﾟｰﾄのためにｸｴﾘｰを使用するには､接頭辞｢ﾚﾎﾟｰﾄ_｣を使用します。

9.	選択/ｸｴﾘｰで（そしてTrimble Geomatics Office 内の他の場所で）新しいｸｴﾘｰが利用できるようになる前に､ﾃﾞｰﾀﾍﾞｰｽｽｷｰﾏﾌｧｲﾙを更新しなければなりません。Microsoft Windows Explorerを使用して､ﾌﾟﾛｼﾞｪｸﾄ（またはﾃﾝﾌﾟﾚｰﾄﾌﾟﾛｼﾞｪｸﾄ）に対して現存するﾃﾞｰﾀﾍﾞｰｽｽｷｰﾏﾌｧｲﾙ(.dbs)を削除します。

ﾉｰﾄ:ﾃﾞｰﾀﾍﾞｰｽｽｷｰﾏﾌｧｲﾙなしのﾌﾟﾛｼﾞｪｸﾄを開く時､Trimble Geomatics Office はﾃﾞｰﾀﾍﾞｰｽﾌｧｲﾙの設定を基礎とした新しいｽｷｰﾏﾌｧｲﾙを自動的に作成します。この新しいｽｷｰﾏﾌｧｲﾙは､新しく追加されたｸｴﾘｰへの参照事項を含みます。新しいｸｴﾘｰは､選択/ｸｴﾘｰでに表示されます。ｶｽﾀﾑASCIIｴｸｽﾎﾟｰﾄとﾚﾎﾟｰﾄ定義でそれを使用することができます。

10.	Trimble Geomatics Office を開いて､ｸｴﾘｰを追加したﾃﾝﾌﾟﾚｰﾄかﾌﾟﾛｼﾞｪｸﾄを開きます。

ここで選択/ｸｴﾘｰでを選ぶことで新しいｸｴﾘｰを使用することができます。新しいｸｴﾘｰが一覧に表示されます。


Trimble Survey Controller からSurvey Controller(*.dc)ﾌｧｲﾙをｲﾝﾎﾟ－ﾄ
Trimble Survey Controller からSurvey Controller(*.dc)ﾌｧｲﾙをｲﾝﾎﾟｰﾄ

概要と詳細

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢測量装置｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢ﾃﾞｰﾀ転送を開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	Survey Controller装置を選択して､開くをｸﾘｯｸします。接続ﾀﾞｲｱﾛｸﾞが現れます。

接続が行われると､｢開く｣ﾀﾞｲｱﾛｸﾞのﾙｯｸｲﾝﾌｨｰﾙﾄﾞがSurvey Controller装置に変わります。

4.	以下の1つを行います。

ｲﾝﾎﾟｰﾄしようとしているﾌｧｲﾙがTrimble Survey Controller のﾒｲﾝﾒﾓﾘにある場合には､ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞのﾌｧｲﾙをｲﾝﾎﾟｰﾄしたい場合には､PCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

ﾉｰﾄ:お手持ちのTrimble装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

5.	開くをｸﾘｯｸします。選択したﾃﾞｨﾚｸﾄﾘが読み込まれます。ﾃﾞｨﾚｸﾄﾘ内のすべてのTrimble Survey Controllerｼﾞｮﾌﾞが表示されます。

6	.ﾌｧｲﾙﾌｫｰﾏｯﾄﾌｨｰﾙﾄﾞで､使用しているﾃﾞｰﾀｺﾚｸﾀｰﾌｧｲﾙﾊﾞｰｼﾞｮﾝを選択します。

7.	ｲﾝﾎﾟｰﾄしたいﾌｧｲﾙを選択し､開くをｸﾘｯｸします。｢ﾀﾞｳﾝﾛｰﾄﾞ｣ﾀﾞｲｱﾛｸﾞが現れ､進行状況ﾊﾞｰがﾌｧｲﾙ転送の進行状況を示します。転送が完了すると｢ﾀﾞｳﾝﾛｰﾄﾞ｣ﾀﾞｲｱﾛｸﾞは消えて､装置への接続は切断されます。

ｼﾞｮﾌﾞﾌｧｲﾙは.dcﾌｧｲﾙに変換され､ﾌﾟﾛｼﾞｪｸﾄﾃﾞｰﾀﾍﾞｰｽにｲﾝﾎﾟｰﾄされます。.dcﾌｧｲﾙはﾌﾟﾛｼﾞｪｸﾄのﾃﾞｰﾀﾌｧｲﾙ\Trimbleﾌｧｲﾙﾌｫﾙﾀﾞに置かれます。

ﾉｰﾄ:Trimble Survey Controller を使用している装置からTrimble Geomatics Office に.dcﾌｧｲﾙを転送すると､それは自動的にﾌﾟﾛｼﾞｪｸﾄにｲﾝﾎﾟｰﾄされます。

ﾉｰﾄ:Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.60 から/へﾃﾞｰﾀを転送する場合には､ﾊﾞｰｼﾞｮﾝ7.50.dcﾌｧｲﾙﾌｫｰﾏｯﾄを使用します。


ご利用のｺﾝﾋﾟｭｰﾀｰにTrimble GPSﾃﾞｰﾀ(.dat)ﾌｧｲﾙをｲﾝﾎﾟｰﾄ

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢GPSﾃﾞｰﾀ(*.dat)ﾌｧｲﾙ｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	ｲﾝﾎﾟｰﾄしたい.datﾌｧｲﾙを見つけて､開くをｸﾘｯｸします。｢DATﾁｪｯｸｲﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	必要な変更を行います。

特に､ｱﾝﾃﾅ高値が正しいかどうかを確認します。あらゆる値を変更しても､.datﾌｧｲﾙ内の実際の値が変更されることはありません。それは､Trimble Geomatics Office でﾌｧｲﾙをｲﾝﾎﾟｰﾄするのに使用される値のみを変更します。これは.datﾌｧｲﾙを元来の状態に保持します。

5.	OKをｸﾘｯｸします。.

ｲﾝﾎﾟｰﾄされたﾌｧｲﾙは､ﾌﾟﾛｼﾞｪｸﾄのﾃﾞｰﾀﾌｧｲﾙ\Trimbleﾌｧｲﾙﾌｫﾙﾀﾞに置かれます。

ﾋﾝﾄ:ﾌｧｲﾙをﾄﾞﾗｯｸﾞ･ﾄﾞﾛｯﾌﾟすることができます。


Trimble GPSﾚｼ－ﾊﾞ－からTrimble GPSﾃﾞ－ﾀ(.dat)ﾌｧｲﾙのｲﾝﾎﾟ－ﾄ
Trimble GPS受信機からTrimble GPSﾃﾞｰﾀ(.dat)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ

概要と詳細

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢測量装置｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢ﾃﾞｰﾀ転送を開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	GPSﾚｼｰﾊﾞｰ装置を選択して､開くをｸﾘｯｸします。接続ﾀﾞｲｱﾛｸﾞが現れます。

接続が行われると､｢開く｣ﾀﾞｲｱﾛｸﾞの注目ﾌｨｰﾙﾄﾞがGPSﾚｼｰﾊﾞｰ装置に変わります。

4.	ｲﾝﾎﾟｰﾄしたいﾌｧｲﾙを選択し､開くをｸﾘｯｸします。｢ﾀﾞｳﾝﾛｰﾄﾞ｣ﾀﾞｲｱﾛｸﾞが現れ､進行状況ﾊﾞｰがﾌｧｲﾙ転送の進行状況を示します。

転送が完了すると｢ﾀﾞｳﾝﾛｰﾄﾞ｣ﾀﾞｲｱﾛｸﾞは消えて､GPSﾚｼｰﾊﾞｰへの接続は切断されます。

｢DATﾁｪｯｸｲﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	必要な変更を行います。

特に､ｱﾝﾃﾅ高値が正しいかどうかを確認します。あらゆる値を変更しても､.datﾌｧｲﾙ内の実際の値が変更されることはありません。それは､Trimble Geomatics Office でﾌｧｲﾙをｲﾝﾎﾟｰﾄするのに使用される値のみを変更します。これは.datﾌｧｲﾙを元来の状態に保持します。

6.	OKをｸﾘｯｸします。

ｲﾝﾎﾟｰﾄされたﾌｧｲﾙは､ﾌﾟﾛｼﾞｪｸﾄのﾃﾞｰﾀﾌｧｲﾙ\Trimbleﾌｧｲﾙﾌｫﾙﾀﾞに置かれます。


RINEX GPSﾃﾞ－ﾀﾌｧｲﾙのｲﾝﾎﾟ－ﾄ
RINEX GPSﾃﾞｰﾀﾌｧｲﾙのｲﾝﾎﾟｰﾄ

概要と詳細

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢RINEXﾌｧｲﾙ｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

ｲﾝﾎﾟｰﾄしたい観測ﾌｧｲﾙを選択します。必要に応じてﾀｲﾌﾟｵﾌﾟｼｮﾝの｢ﾌｧｲﾙ｣を変更します。開くをｸﾘｯｸします。

付随する.nav（航法）ﾌｧｲﾙが同じ名前を持つ場合には､これは自動的に観測ﾌｧｲﾙに関連付けられます。

付随する.navﾌｧｲﾙが同じ名前を持たない場合には､｢航法ﾌｧｲﾙの一致｣ﾀﾞｲｱﾛｸﾞが現れます。観測ﾌｧｲﾙは観測ﾌｧｲﾙの下で一覧化されています。適切な.navﾌｧｲﾙを選択して､OKをｸﾘｯｸします。

ﾉｰﾄ:それぞれの観測ﾌｧｲﾙは付随する.navﾌｧｲﾙを持たなければなりません。正しい.navﾌｧｲﾙが選択されていない場合には､ｲﾝﾎﾟｰﾄ中にﾒｯｾｰｼﾞが現れ､基線は処理されません。

4.	ﾌｧｲﾙはTrimble GPSﾃﾞｰﾀﾌｧｲﾙﾌｫｰﾏｯﾄに変換されます。｢DATﾁｪｯｸｲﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	必要な変更を行います。

特に､ｱﾝﾃﾅ高値とﾚｼｰﾊﾞｰﾀｲﾌﾟが正しいかどうかを確認します。あらゆる値を変更しても､GPSﾃﾞｰﾀﾌｧｲﾙ内の実際の値が変更されることはありません。それは､Trimble Geomatics Office でﾌｧｲﾙをｲﾝﾎﾟｰﾄするのに使用される値のみを変更します。これはGPSﾃﾞｰﾀﾌｧｲﾙを元来の状態に保持します。

ﾋﾝﾄ:DATﾁｪｯｸｲﾝ時にﾚｼｰﾊﾞｰとｱﾝﾃﾅﾀｲﾌﾟが未知になっていないことを確認します。

6.	OKをｸﾘｯｸします。

ｲﾝﾎﾟｰﾄされたﾌｧｲﾙは､ﾌﾟﾛｼﾞｪｸﾄのﾃﾞｰﾀﾌｧｲﾙ\Trimbleﾌｧｲﾙﾌｫﾙﾀﾞに置かれます。


ｶｽﾀﾑｲﾝﾎﾟｰﾄ･ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの作成
ｶｽﾀﾑ ｲﾝﾎﾟｰﾄ / ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの作成

概要と詳細

この例ではｶｽﾀﾑｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを定義します。ﾌｫｰﾏｯﾄは､ﾎﾟｲﾝﾄ名（大文字で）と北距（単位と）､東距（単位と）､標高（単位と）を含むｶﾝﾏで区切られたﾃｷｽﾄﾌｧｲﾙです。ﾌｨｰﾙﾄﾞｺｰﾄﾞは必要なﾌｨｰﾙﾄﾞを選択するために使用されます。ｶｽﾀﾑｲﾝﾎﾟｰﾄﾌｫｰﾏｯﾄは同様な方法で定義されます。

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	ｶｽﾀﾑﾀﾌﾞで､新規をｸﾘｯｸします。｢ASCIIｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢名前｣ﾌｨｰﾙﾄﾞに名前を入力します。

4.	｢本文ﾌｫｰﾏｯﾄ｣ﾌｨｰﾙﾄﾞで右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/名前を選択します。

本文ﾌｫｰﾏｯﾄﾎﾞｯｸｽに[名前]が現れます。

5.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/高度/修飾子/大文字を選択します。

[名前:大文字]が本文ﾌｫｰﾏｯﾄﾎﾞｯｸｽに現れます。これは､すべてのﾎﾟｲﾝﾄ名が大文字でｴｸｽﾎﾟｰﾄされることを意味します。

6.	ｶﾝﾏ､そしてｽﾍﾟｰｽを入力します。

7.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/北距を選択します。

[北距]がｶﾝﾏの脇に現れます。

8.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/高度/修飾子/単位を選択します。

[北距]が[北距:単位]に変わります。これは､現在の座標単位がﾌｧｲﾙに含まれることを意味します。

9.	ｶﾝﾏ､そしてｽﾍﾟｰｽを入力します。

10.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/東距を選択します。

[東距]がｶﾝﾏの脇に現れます。

11.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/高度/修飾子/単位を選択します。

[東距]が[東距:単位]に変わります。これは､現在の座標単位がﾌｧｲﾙに含まれることを意味します。

12.	ｶﾝﾏ､そしてｽﾍﾟｰｽを入力します。

13.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/標高を選択します。

[標高]がｶﾝﾏの脇に現れます。

14.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/高度/修飾子/単位を選択します。

[標高]が[標高:単位]に変わります。これは､現在の座標単位がﾌｧｲﾙに含まれることを意味します。

15.	OKをｸﾘｯｸして､ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを保存します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。作成したﾌｫｰﾏｯﾄが､ｶｽﾀﾑﾀﾌﾞの一覧に現れます。

16.	このﾌｫｰﾏｯﾄでﾃﾞｰﾀをｴｸｽﾎﾟｰﾄするには､ﾌｫｰﾏｯﾄを選択してOKをｸﾘｯｸします。｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

17.	｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞで､ｴｸｽﾎﾟｰﾄﾌｧｲﾙに対する名前を入力し､ﾌｧｲﾙを作成するために保存をｸﾘｯｸします。


Survey Controller(*.dc)ﾌｧｲﾙをTrimble Survey Controller にｴｸｽﾎﾟ－ﾄ
Survey Controller(*.dc)ﾌｧｲﾙをTrimble Survey Controller にｴｸｽﾎﾟｰﾄ

概要と詳細

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢測量｣ﾀﾌﾞで､｢測量装置｣ｵﾌﾟｼｮﾝを選択します。

3.	ｵﾌﾟｼｮﾝをｸﾘｯｸして､ﾌｧｲﾙに対するｼﾞｮﾌﾞ設定を特定します。

4.	現れたﾀﾞｲｱﾛｸﾞでOKをｸﾘｯｸして､変更を受け入れ､｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞに戻ります。

5.	OKをｸﾘｯｸします。｢ﾃﾞｰﾀ転送､名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

6.	Trimble Survey Controller装置を選択して､開くをｸﾘｯｸします。｢接続｣ﾀﾞｲｱﾛｸﾞが現れます。

7.	接続が行われると､｢保存｣ﾀﾞｲｱﾛｸﾞが現れます。

8.	以下の1つを行います。

ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller のﾒｲﾝﾒﾓﾘのﾌｧｲﾙに保存します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞにﾌｧｲﾙを保存したい場合には､PCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

ﾉｰﾄ:お手持ちのTrimble装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

9.	開くをｸﾘｯｸします。

選択したﾌｫﾙﾀﾞは読み込まれます。そのﾌｫﾙﾀﾞ内のすべてのSurvey Controllerﾌｧｲﾙは表示されます。Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄ名が｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞに表示されます。これは､Trimble Survey Controller へｴｸｽﾎﾟｰﾄされるTrimble Survey Controller ｼﾞｮﾌﾞの名前です。必要に応じてこの名前を編集することができます。

10.	保存をｸﾘｯｸします。読込みﾀﾞｲｱﾛｸﾞが現れます。進行状況ﾊﾞｰが転送の進行状況を表示します。転送が完了すると､読込みﾀﾞｲｱﾛｸﾞが消えて､装置への接続は切断されます。

ここでTrimble Survey Controller 内のﾌｧｲﾙを使用することができます。

ﾉｰﾄ:Trimble Survey Controllerﾊﾞｰｼﾞｮﾝ7.60 から/へﾃﾞｰﾀを転送する場合には､ﾊﾞｰｼﾞｮﾝ7.50.dcﾌｧｲﾙﾌｫｰﾏｯﾄを使用します。


AutoCAD (*.dxf)ﾌｧｲﾙのｴｸｽﾎﾟｰﾄ

概要と詳細

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	CAD /ASCIIﾀﾌﾞで､｢AutoCAD (*.dxf)｣ｵﾌﾟｼｮﾝを選択します。

3.	ｵﾌﾟｼｮﾝをｸﾘｯｸして､ｴｸｽﾎﾟｰﾄ先の.dxfﾊﾞｰｼﾞｮﾝとﾀｲﾌﾟを設定します。

4.	OKをｸﾘｯｸします。｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾌｧｲﾙを保存したいﾌｫﾙﾀﾞに進みます。

6.	ﾌｧｲﾙの名前を入力し､保存をｸﾘｯｸします。

ﾌｧｲﾙが作成されました｡

標準では､Trimble Geomatics Office は､ﾎﾟｲﾝﾄ名をﾎﾟｲﾝﾄの属性としてｴｸｽﾎﾟｰﾄします。ﾎﾟｲﾝﾄに関するその他の情報をｴｸｽﾎﾟｰﾄするには､ｵﾌﾟｼｮﾝ.iniﾌｧｲﾙのDXF/DWG属性ﾌﾞﾛｯｸ定義を編集します。

ﾉｰﾄ:ﾄﾞﾛｰｲﾝｸﾞ(*.dwg)ﾌｧｲﾙをｴｸｽﾎﾟｰﾄするのにこういったｽﾃｯﾌﾟを使用することができます。ｽﾃｯﾌﾟ4では､.dwgﾌｫｰﾏｯﾄとﾊﾞｰｼﾞｮﾝを設定するためにｵﾌﾟｼｮﾝをｸﾘｯｸします。


ﾌﾟﾛｼﾞｪｸﾄに対する単位の変更

概要と詳細

1.	ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します。ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨﾀﾞｲｱﾛｸﾞが現れます。

2.	単位とﾌｫｰﾏｯﾄのﾀﾌﾞで､変更したい単位やﾌｫｰﾏｯﾄのﾌｨｰﾙﾄﾞを選択します。

3.	一覧から必要とされるｵﾌﾟｼｮﾝを選択し､OKをｸﾘｯｸして変更を適用します。


属性に対してﾌﾟﾛｼﾞｪｸﾄを設定

概要と詳細

1.	ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します。｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	特徴ﾀﾌﾞで､｢属性の使用｣ﾁｪｯｸﾎﾞｯｸｽを選択します。ﾗｲﾌﾞﾗﾘﾌｨｰﾙﾄﾞが利用できるようになります。

3.	参照をｸﾘｯｸして､必要とする特徴･属性ﾗｲﾌﾞﾗﾘﾌｧｲﾙ(*.fcl)かﾃﾞｰﾀ辞書ﾌｧｲﾙ(*.ddf)の位置を示します。

4.	OKをｸﾘｯｸします。選択したﾌｧｲﾙは､属性を持つそれぞれの特徴ｺｰﾄﾞに対するﾃﾞｰﾀﾍﾞｰｽﾃｰﾌﾞﾙを作成するのに使用されます。ここで属性を持つ.dcﾌｧｲﾙをｲﾝﾎﾟｰﾄすることができます。


保存されたｻｲﾄをﾌﾟﾛｼﾞｪｸﾄ座標系として選択

概要と詳細

1.	ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します。｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	座標系ﾀﾌﾞを選択します。

3.	設定ｸﾞﾙｰﾌﾟの座標系で､変更をｸﾘｯｸします。｢座標系の選択｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	｢新しい座標系｣を選択し､次へをｸﾘｯｸします。｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	｢ｷｬﾘﾌﾞﾚｰﾄされたｻｲﾄ｣を選択し､次へをｸﾘｯｸします。｢ｷｬﾘﾌﾞﾚｰﾄされたｻｲﾄの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

6.	必要なｻｲﾄを選択し､終了をｸﾘｯｸします。

座標系がﾃﾞｰﾀﾍﾞｰｽに適用されます。ﾃﾞｰﾀﾍﾞｰｽ内に現存するﾎﾟｲﾝﾄのすべては､新しい座標系に変換されます。変換過程に関する情報は､座標系－概要の項を参照してください。

ﾌﾟﾛｼﾞｪｸﾄにﾎﾟｲﾝﾄﾎﾟｼﾞｼｮﾝを持つか､ﾇﾙ標高を持つ座標を入力する時､標準標高が定義されていない場合には､Trimble Geomatics Office は現存するﾎﾟｲﾝﾄをある座標系から別へと変換することができないので､座標系選択に失敗します。


属性のｴｸｽﾎﾟｰﾄ

概要と詳細

以下を含むﾌｧｲﾙをｴｸｽﾎﾟｰﾄすることができます。

特別な特徴をもつﾎﾟｲﾝﾄすべて

すべての属性

各特徴に対して別々のﾌｧｲﾙをｴｸｽﾎﾟｰﾄするには､

1.	希望する特徴を含むﾎﾟｲﾝﾄの選択

2.	ｶｽﾀﾑｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの設定


希望する特徴を含むﾎﾟｲﾝﾄの選択

これを行うには､

1.	計画表示から､選択/ﾎﾟｲﾝﾄ特徴でを選びます。例えば､木の属性すべてをﾚﾎﾟｰﾄしたい場合には､｢ﾎﾟｲﾝﾄ特徴で選択｣ﾀﾞｲｱﾛｸﾞで｢木｣を選択します。

2.	OKをｸﾘｯｸします。特定した特徴ｺｰﾄﾞを持つﾎﾟｲﾝﾄすべては､ここで選択されます。


ｶｽﾀﾑﾚﾎﾟｰﾄﾌｫｰﾏｯﾄの設定

これを行うには､

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢ｶｽﾀﾑ｣ﾀﾌﾞで､新規をｸﾘｯｸします。｢ASCIIｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢名前｣ﾌｨｰﾙﾄﾞで､ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの名前を入力します。

4.	｢説明｣ﾌｨｰﾙﾄﾞで､ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの説明を入力します。ﾌｫｰﾏｯﾄに対する説明は必須ではありません。

5.	｢ﾎﾟｲﾝﾄ情報｣が｢ﾌｨｰﾙﾄﾞからｴｸｽﾎﾟｰﾄ｣で選択されたことを確認してください。これは､ﾎﾟｲﾝﾄに対してﾚﾎﾟｰﾄしているためです。

6.	｢ﾎﾟｲﾝﾄﾃｰﾌﾞﾙ｣からﾌｫｰﾏｯﾄﾍｯﾀﾞｰと本文ﾌｫｰﾏｯﾄへのﾌｨｰﾙﾄﾞのすべてを記入するために､｢ﾌｫｰﾏｯﾄを自動的に記入｣をｸﾘｯｸします。

7.	表示される｢ﾌｫｰﾏｯﾄの挿入｣ﾀﾞｲｱﾛｸﾞで､ﾌｫｰﾏｯﾄに対して必要な適切な区切り文字を選択します。

8.	ﾌｫｰﾏｯﾄに含めたくない見出しとﾌｨｰﾙﾄﾞを削除します。

9.	ﾌｫｰﾏｯﾄﾍｯﾀﾞｰ一覧で､ﾌｫｰﾏｯﾄに含めたい属性見出しを追加します。

10.	属性ﾚｺｰﾄﾞはﾎﾟｲﾝﾄﾃｰﾌﾞﾙに保管されていません。適切な特徴ﾃｰﾌﾞﾙからﾌｫｰﾏｯﾄに含まれるべきﾌｨｰﾙﾄﾞを追加します。こういったﾌｨｰﾙﾄﾞにｱｸｾｽするには､｢本文ﾌｫｰﾏｯﾄ｣ﾎﾞｯｸｽを右ｸﾘｯｸし､ｼｮｰﾄｶｯﾄﾒﾆｭｰから選択します。

11.	ﾌｨｰﾙﾄﾞ/高度/属性を選択します。属性を持つすべての特徴ｺｰﾄﾞ（属性に対してﾌﾟﾛｼﾞｪｸﾄを設定するのに使用される特徴･属性ﾗｲﾌﾞﾗﾘ内）が表示されます。

12.	選択したのと同じ特徴ｺｰﾄﾞ（例､｢木｣）を選びます。属性がその先のｻﾌﾞﾒﾆｭｰに現れます。

13.	ﾚﾎﾟｰﾄをしたい属性をｸﾘｯｸします。選択した属性が｢本文ﾌｫｰﾏｯﾄ｣ﾎﾞｯｸｽの中に現れます。

ﾉｰﾄ:ある特定の特徴に対する属性すべてをﾚﾎﾟｰﾄしたい場合には､ｼｮｰﾄｶｯﾄﾒﾆｭｰからｱｽﾃﾘｽｸ(*)ｵﾌﾟｼｮﾝを選択します。すべての属性は､本文ﾌｫｰﾏｯﾄに追加されます。

14.	ﾌｧｲﾙにｴｸｽﾎﾟｰﾄしたい各属性に対して､上記のｽﾃｯﾌﾟを繰り返します。

15.	ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを完成して､OKをｸﾘｯｸします。ﾌｫｰﾏｯﾄはｶｽﾀﾑ一覧に追加されました。

16.	このﾌｫｰﾏｯﾄでﾌｧｲﾙをｴｸｽﾎﾟｰﾄするには､ﾌｫｰﾏｯﾄを反転表示して､OKをｸﾘｯｸします。


すべての属性を持つ単一ﾌｧｲﾙをｴｸｽﾎﾟｰﾄ

これを行うには､

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	GISﾀﾌﾞで､｢名前､緯度､経度､高度､全属性（ﾛｰｶﾙ）｣ｵﾌﾟｼｮﾝか､｢名前､北､東､高度､全属性｣ｵﾌﾟｼｮﾝを選択します。

3.	OKをｸﾘｯｸします。

4.	｢保存｣ﾀﾞｲｱﾛｸﾞが現れます。ﾌｧｲﾙ名と場所を入力して､OKをｸﾘｯｸします。

属性を含むﾌｧｲﾙが作成されました。


属性を持つSurvey Controller(*.dc)ﾌｧｲﾙのｲﾝﾎﾟｰﾄ

概要と詳細

ﾉｰﾄ:Trimble Geomatics Office の属性を使用するには､最初に属性に対してﾌﾟﾛｼﾞｪｸﾄを設定しなければなりません。

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢Survey Controllerﾌｧｲﾙ(*.dc)｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。

Trimble Geomatics Office は､現在のTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄで特定された特徴･属性ﾗｲﾌﾞﾗﾘ(*.fcl)かﾃﾞｰﾀ辞書(*.ddf)ﾌｧｲﾙが.dcﾌｧｲﾙ内のものと同じかどうかを確認します。

それが異なる場合には､以下のｵﾌﾟｼｮﾝを利用できます。

ｲﾝﾎﾟｰﾄを取り消します。

すべてのﾎﾟｲﾝﾄと､現在のTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄに認識される属性情報をｲﾝﾎﾟｰﾄします。ﾃﾞｰﾀを失うことになるかもしれないと警告されます。ｲﾝﾎﾟｰﾄﾚﾎﾟｰﾄは､どの属性情報がｲﾝﾎﾟｰﾄされなかったのかを教えてくれます。

ﾎﾟｲﾝﾄのみをｲﾝﾎﾟｰﾄします。（属性情報はｲﾝﾎﾟｰﾄされません。）

特徴･属性ﾗｲﾌﾞﾗﾘが現在のTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄで定義されていない場合､属性情報なしで.dcﾌｧｲﾙをｲﾝﾎﾟｰﾄしたり､ｲﾝﾎﾟｰﾄを取り消したりできます。

ﾉｰﾄ:Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.60 から/へﾃﾞｰﾀを転送する場合には､ﾊﾞｰｼﾞｮﾝ7.50.dcﾌｧｲﾙﾌｫｰﾏｯﾄを使用します。


ﾚｲﾔｰの追加

概要と詳細

1.	計画表示で以下の1つを行います。

編集/ﾚｲﾔｰを選択します。

｢ﾚｲﾔｰの編集｣ﾂｰﾙをｸﾘｯｸします。

｢ﾚｲﾔｰ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	新規をｸﾘｯｸします。新しい列が｢ﾚｲﾔｰ｣ﾀﾞｲｱﾛｸﾞに現れます。

3.	｢名前｣ﾌｨｰﾙﾄﾞで､新しいﾚｲﾔｰに独特の名前を入力します。

4.	一覧から､標準ﾎﾟｲﾝﾄｽﾀｲﾙを選択します。このﾎﾟｲﾝﾄｽﾀｲﾙは､その｢ﾎﾟｲﾝﾄｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで｢ﾚｲﾔｰで｣が選択されたすべてのﾎﾟｲﾝﾄに使用されます。

5.	一覧から標準ﾗｲﾝｽﾀｲﾙを選択します。このﾗｲﾝｽﾀｲﾙは､その｢ﾗｲﾝｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで｢ﾚｲﾔｰで｣が選択されたﾗｲﾝと円弧､曲線すべてに使用されます。

6.	一覧からﾃｷｽﾄｽﾀｲﾙを選択します。このﾃｷｽﾄｽﾀｲﾙは､その｢ﾃｷｽﾄｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで｢ﾚｲﾔｰで｣が選択されたすべてのﾃｷｽﾄに使用されます。

7.	ﾚｲﾔｰ内のすべてのｴﾝﾃｨﾃｨを表示したい場合には､｢表示｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

ﾚｲﾔｰのｴﾝﾃｨﾃｨが選択されることができるように､｢ﾛｯｸ｣ﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。

9.	OKをｸﾘｯｸします。


重複名を持つﾎﾟｲﾝﾄの結合

概要と詳細

Trimble Geomatics Office 内の重複ﾎﾟｲﾝﾄが物理的に同一のﾎﾟｲﾝﾄだとわかっている場合や､別々である必要がない場合には､それを結合することができます。

警告:同じ名前を持つけれども非常に異なるﾃﾞｰﾀを持つ2つのﾎﾟｲﾝﾄはｴﾗｰの結果かもしれません。それを結合すると思わしくない予想外の結果を引き起こすかもしれません。

1.	ﾎﾟｲﾝﾄが物理的に同じﾎﾟｲﾝﾄであることを確認してください。これを行うには､選択/重複ﾎﾟｲﾝﾄ/名前と距離でを選びます。

2.	分割距離を入力して､OKをｸﾘｯｸします。.

3.	編集/重複ﾎﾟｲﾝﾄの結合を選択します。

Trimble Geomatics Office は､ﾎﾟｲﾝﾄへの観測のすべてと､ﾎﾟｲﾝﾄに対するｷｰﾎﾞｰﾄﾞ入力ﾎﾟｼﾞｼｮﾝを結合します。ｽﾃｰﾀｽﾊﾞｰは結合作業の要旨をﾚﾎﾟｰﾄします。


ｲﾝﾎﾟｰﾄ中の重複ﾎﾟｲﾝﾄの処理方法の特定

概要と詳細

標準では､Trimble Geomatics Office は､重複ﾎﾟｲﾝﾄが作成されないように､ｲﾝﾎﾟｰﾄ中に同じ名前のﾎﾟｲﾝﾄを結合します。｢重複ﾎﾟｲﾝﾄﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞで､どの水平と/または垂直許容値内でｿﾌﾄｳｪｱがﾎﾟｲﾝﾄを結合するか､またはｲﾝﾎﾟｰﾄ中に重複ﾎﾟｲﾝﾄを全く処理しないようにするかを特定できます。

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	ｵﾌﾟｼｮﾝをｸﾘｯｸします。｢重複ﾎﾟｲﾝﾄﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

以下の1つを行います。

｢常に重複ﾎﾟｲﾝﾄの結合｣ｵﾌﾟｼｮﾝが選択されていることを確認します。

｢許容値内で重複ﾎﾟｲﾝﾄの結合｣ｵﾌﾟｼｮﾝを選択して､適切な許容値を入力します。

ｲﾝﾎﾟｰﾄ中にｿﾌﾄｳｪｱが重複ﾎﾟｲﾝﾄを解決しないように特定するには､｢重複ﾎﾟｲﾝﾄの結合｣ｵﾌﾟｼｮﾝを選択して､水平許容値を0.02（これは水平測量の質の許容値）と､垂直許容値を0.050（これは垂直測量の質の許容値）と入力します。

ﾉｰﾄ:許容値が特定されていない場合（それは､許容値ｸﾞﾙｰﾌﾟで水平と垂直のﾁｪｯｸﾎﾞｯｸｽがｵﾌになっていることを意味します）､重複ﾎﾟｲﾝﾄは結合されます。

ﾉｰﾄ:許容値が0.000に設定されている場合､重複ﾎﾟｲﾝﾄ座標は結合されようとするﾎﾟｲﾝﾄと正確に同一である必要があります。

こういった設定は､すべてのｲﾝﾎﾟｰﾄｵﾌﾟｼｮﾝに適用されます。ﾌﾟﾛｼﾞｪｸﾄﾊﾞｰを使用してﾌｧｲﾙをｲﾝﾎﾟｰﾄする場合も､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄへとﾌｧｲﾙをﾄﾞﾗｯｸﾞ･ﾄﾞﾛｯﾌﾟする場合も､ｿﾌﾄｳｪｱは最後に特定した重複ﾎﾟｲﾝﾄ設定を使用します。


重複ﾎﾟｲﾝﾄの名前変更

概要と詳細

2人のﾌｨｰﾙﾄﾞｽﾀｯﾌが別々のSurvey Controller(*.dc)ﾌｧｲﾙで異なるﾎﾟｲﾝﾄに対して同じ名前を使用した時などに､重複ﾎﾟｲﾝﾄの名前を変更するのにこの手順が使用されます。

1.	｢重複ﾎﾟｲﾝﾄﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞで選択された｢許容値内での重複ﾎﾟｲﾝﾄの結合｣ｵﾌﾟｼｮﾝを使用してﾌｧｲﾙをｲﾝﾎﾟｰﾄします。水平許容値を0.02に､垂直許容値を0.050に設定します。

ﾉｰﾄ:ﾃﾞｰﾀをｲﾝﾎﾟｰﾄするまで重複ﾎﾟｲﾝﾄがあることに気づかなかった場合には､ｲﾝﾎﾟｰﾄ作業を元に戻し､｢重複ﾎﾟｲﾝﾄﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞの｢許容値内での重複ﾎﾟｲﾝﾄの結合｣ｵﾌﾟｼｮﾝで水平許容値を0.02（これは､水平測量の質の許容値です）に､垂直許容値を0.050（これは､垂直測量の質の許容値です）設定して､ﾃﾞｰﾀを再びｲﾝﾎﾟｰﾄします。

2.	ﾃﾞｰﾀﾍﾞｰｽに重複ﾎﾟｲﾝﾄを追加するSurvey Controller(*.dc)ﾌｧｲﾙ選択ｾｯﾄを選択します。または､選択/重複ﾎﾟｲﾝﾄ/名前でを選択します。

3.	編集/名前の変更を選択します。｢名前の変更｣ﾀﾞｲｱﾛｸ｢名前の変更｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	選択の最初のﾎﾟｲﾝﾄの新しい名前を入力します。

Trimble Geomatics Office は､選択ｾｯﾄ内のすべてのﾎﾟｲﾝﾄの名前を変更します。ﾎﾟｲﾝﾄは､ｾｯﾄに割り当てられた開始値に従って名前が変更されます。

例えば､5つのﾎﾟｲﾝﾄを選択してあるとします。最初のﾎﾟｲﾝﾄを2000という名前に変更すると､残りの4つのﾎﾟｲﾝﾄは2001､2002､2003､2004という名前に変更されます。


ｶｽﾀﾑﾗﾍﾞﾙを使用してﾎﾟｲﾝﾄにﾗﾍﾞﾙ付け

概要と詳細

この例では､ﾎﾟｲﾝﾄの説明のｶｽﾀﾑﾗﾍﾞﾙを使用して､ﾎﾟｲﾝﾄにﾗﾍﾞﾙ付けをします。

1.	Microsoft Windows Explorerを使用して､ｶｽﾀﾑﾗﾍﾞﾙｵﾌﾟｼｮﾝを追加したいﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄかﾌﾟﾛｼﾞｪｸﾄに対するｵﾌﾟｼｮﾝ.iniﾌｧｲﾙの場所を探し出します。

2.	ｵﾌﾟｼｮﾝ.iniﾌｧｲﾙを開くためにﾃｷｽﾄｴﾃﾞｨﾀを使用します。

3.	以下の見出しを探します。

[ﾗﾍﾞﾙ]

4.	ﾗﾍﾞﾙｵﾌﾟｼｮﾝの最後のすぐ後に､ｷｰﾎﾞｰﾄﾞを使用して以下のﾃｷｽﾄを記入します。

|X|[Y]

｢X｣はﾗﾍﾞﾙの名前を定義し､｢Y｣はﾎﾟｲﾝﾄにﾗﾍﾞﾙ付けをしたい特徴ｺｰﾄﾞを定義します。

5.	Trimble Geomatics Office でﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄかﾌﾟﾛｼﾞｪｸﾄを開きます。

6.	表示/ﾎﾟｲﾝﾄﾗﾍﾞﾙを選択します。新しいｵﾌﾟｼｮﾝが一覧に追加されたﾎﾟｲﾝﾄﾗﾍﾞﾙﾀﾞｲｱﾛｸﾞが現れます｡

7.	必要なｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。


ｴﾝﾃｨﾃｨの注釈

概要と詳細

1.	注釈したいﾎﾟｲﾝﾄかﾗｲﾝ､円弧を選択します。これを行うには､以下の1つを使用します。

ﾏｳｽ

選択ﾒﾆｭｰ

2.	挿入/注釈を選択します。｢注釈｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	一覧から､必要とするﾃﾝﾌﾟﾚｰﾄを選択します。

4.	注釈ﾃﾝﾌﾟﾚｰﾄを編集するには､ﾃﾝﾌﾟﾚｰﾄをｸﾘｯｸします。

現存する注釈を保持するには､｢現存する注釈を保持｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

新しい注釈を適用する前に現存する注釈を除去するには､｢現存する注釈を保持｣ﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。

5.	注釈するためにｴﾝﾃｨﾃｨのｸﾞﾙｰﾌﾟを選択する場合には､注釈ｸﾞﾙｰﾌﾟが｢選択｣に設定されていることを確認してください。

ﾃﾞｰﾀﾍﾞｰｽ全体を注釈したい場合には､｢ﾃﾞｰﾀﾍﾞｰｽ全体｣ｵﾌﾟｼｮﾝを選択します。

ｴﾝﾃｨﾃｨが選択されていない場合には､注釈ｸﾞﾙｰﾌﾟは利用できず､ﾃﾞｰﾀﾍﾞｰｽ全体が注釈されます。

6.	OKをｸﾘｯｸして､注釈を適用します。

注釈は､ﾃﾞｰﾀﾍﾞｰｽに追加され､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに表示されます。


選択ｾｯﾄの作成

概要と詳細

1.	選択ｾｯﾄに含めたいｴﾝﾃｨﾃｨを選択します。（ﾎﾟｲﾝﾄ､ﾗｲﾝ､観測､曲線､円弧､ﾃｷｽﾄ､注釈）これを行うには､以下の1つを使用します。

ﾏｳｽ

選択ﾒﾆｭｰ

2.	選択/選択ｾｯﾄ/保存を選択します。｢保存｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	選択ｾｯﾄに対する名前を入力して､OKをｸﾘｯｸします。

ここで選択/選択ｾｯﾄ/復元を選ぶと､保存された選択ｾｯﾄの一覧にその選択ｾｯﾄが現れます。選択/選択ｾｯﾄを選ぶと､最近使用された選択ｾｯﾄにも現れます。

ﾋﾝﾄ:選択ｾｯﾄを表示するには､｢表示ﾌｨﾙﾀｰ｣ﾀﾞｲｱﾛｸﾞを使用します。


GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝの実行

概要と詳細

以下の理由でTrimble Geomatics Office でGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行する必要があるかもしれません。

Trimble Survey Controller にｷｬﾘﾌﾞﾚｰｼｮﾝを転送する。

ﾌｨｰﾙﾄﾞでｷｬﾘﾌﾞﾚｰｼｮﾝが行なわれなかった。

質ｺﾝﾄﾛｰﾙﾚｺｰﾄﾞに対するﾚﾎﾟｰﾄを作成する。

Trimble Survey Controller で実行されたｷｬﾘﾌﾞﾚｰｼｮﾝにﾎﾟｲﾝﾄを追加する。


GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行するための準備

GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行する前に､各ｷｬﾘﾌﾞﾚｰｼｮﾝﾎﾟｲﾝﾄが地上(ｸﾞﾘｯﾄﾞ)かGPSﾃﾞｰﾀ(WGS-84)から引き出された座標を持つことを確認する必要があります。

Trimble Survey Controller でｷｬﾘﾌﾞﾚｰｼｮﾝを実行し､ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄとGPSﾎﾟｲﾝﾄが同じ名前を持っている場合には､こういったﾎﾟｲﾝﾄはｲﾝﾎﾟｰﾄ中に結合されます。Trimble Geomatics Office でGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行することを選ぶ場合には､結合されたﾎﾟｲﾝﾄは自動的に分割されます。これが起こると､ｿﾌﾄｳｪｱでGPSとｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄに対して同じ名前が使用されたことを知らせるﾒｯｾｰｼﾞが現れます。

以下の1つを行います。

はいをｸﾘｯｸして､ﾃﾞｰﾀﾍﾞｰｽで同じ名前を持つGPSﾎﾟｲﾝﾄと別のｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄを作成します。

GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行したくない場合や､ﾎﾟｲﾝﾄを自分で分割したい場合には､取消をｸﾘｯｸします。自分でﾎﾟｲﾝﾄを分割する場合には､GPSﾎﾟｲﾝﾄの名前を変更するｵﾌﾟｼｮﾝが与えられます。


GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝの実行

1.	測量/GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを選択します。｢GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢ｷｬﾘﾌﾞﾚｰｼｮﾝ要素｣ｸﾞﾙｰﾌﾟで､計算したいｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀを選択します。

3.	ﾎﾟｲﾝﾄ一覧を選択します。｢ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	｢ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞを使用して､ｷｬﾘﾌﾞﾚｰｼｮﾝに対するﾎﾟｲﾝﾄﾍﾟｱを選択します。（GPSﾎﾟｲﾝﾄとｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄ）別々のGPSとｸﾞﾘｯﾄﾞ値がある限り､それは同じﾎﾟｲﾝﾄであることも同じ名前を持つ異なるﾎﾟｲﾝﾄであることもあります。

5.	ｷｬﾘﾌﾞﾚｰｼｮﾝで必要とされる最初のGPSﾎﾟｲﾝﾄと､以下の1つを行います。

ﾎﾟｲﾝﾄを選択するためにﾌｨｰﾙﾄﾞ記入を使用します。

ｷｰﾎﾞｰﾄﾞを使用してﾎﾟｲﾝﾄ名を入力します。

ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳのGPSﾎﾟｲﾝﾄにﾎﾞｯｸｽが現れます。

ﾉｰﾄ:同じ名前を持つ付随するｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄを持つ場合には､ﾎﾟｲﾝﾄ一覧は自動的に記入されます。

6.	選択したGPSﾎﾟｲﾝﾄに関連するｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄを入力するには､以下の1つを行います。

ﾎﾟｲﾝﾄを選択するためにﾌｨｰﾙﾄﾞ記入を使用します。

ｷｰﾎﾞｰﾄﾞを使用してﾎﾟｲﾝﾄ名を入力します。

ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳのｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄ上に十字が現れ､｢ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞの新しいｴﾝﾄﾘが追加されます。

ﾀｲﾌﾟﾌｨｰﾙﾄﾞは､選択されたﾎﾟｲﾝﾄが水平か垂直の座標要素（または両方）を持つかどうかを示すために更新されます。共通の座標要素がない場合には､ﾀｲﾌﾟは無効と示され､座標は使用されません。

7.	ｷｬﾘﾌﾞﾚｰｼｮﾝに必要なﾎﾟｲﾝﾄﾍﾟｱを選択するまで､上記の2つのｽﾃｯﾌﾟを繰り返します。

8.	すべてのﾎﾟｲﾝﾄﾍﾟｱを選択してから､閉じるをｸﾘｯｸして｢GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ｣ﾀﾞｲｱﾛｸﾞに戻ります。

ﾉｰﾄ:ｷｬﾘﾌﾞﾚｰｼｮﾝ統計はﾎﾟｲﾝﾄﾀﾞｲｱﾛｸﾞの一番下に表示され､有効なﾎﾟｲﾝﾄﾍﾟｱが入力されると算出されます。この統計を使用して､正しくないﾎﾟｲﾝﾄﾍﾟｱを識別します。

9.	算出をｸﾘｯｸして､ｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀを計算します。ｷｬﾘﾌﾞﾚｰｼｮﾝの結果は｢ｷｬﾘﾌﾞﾚｰｼｮﾝ要旨｣ｸﾞﾙｰﾌﾟに現れます。

10.	結果が予想範囲外である場合には､GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝﾚﾎﾟｰﾄを使用して､ﾎﾟｲﾝﾄﾍﾟｱ間の大きな残差すべてをﾁｪｯｸします。ﾚﾎﾟｰﾄは､標準HTMLﾋﾞｭｰｱに表示されます。

11.	ﾚﾎﾟｰﾄの｢GPSと既知座標間の残差｣ｾｸｼｮﾝで残差をﾁｪｯｸします。必要であれば､疑いを持てるﾎﾟｲﾝﾄﾍﾟｱを除去して､ｷｬﾘﾌﾞﾚｰｼｮﾝを再び適用します。

12.	OKをｸﾘｯｸして､ﾌﾟﾛｼﾞｪｸﾄにｷｬﾘﾌﾞﾚｰｼｮﾝを適用します。

座標系は､ｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀと一緒に更新されました。


特徴ｺｰﾄﾞの処理

概要と詳細

1.	選択/選択ｾｯﾄ/復元を選択します。｢復元｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	処理するﾌｧｲﾙ（特徴ｺｰﾄﾞが収集された）と同じ名前を持つ選択ｾｯﾄを選択します。これの選択ｾｯﾄはﾌｧｲﾙがｲﾝﾎﾟｰﾄされた時に自動的に作成され､ﾌｨｰﾙﾄﾞで収集されたﾎﾟｲﾝﾄの順番に関するﾚﾎﾟｰﾄを持ちます。この選択ｾｯﾄを使用することで､特徴ｺｰﾄﾞは正しい順番で処理されることを確実にします。

3.	ﾂｰﾙ/特徴ｺｰﾄﾞの処理を選択します。｢特徴ｺｰﾄﾞの処理｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	特徴ｺｰﾄﾞを処理するのに必要なﾗｲﾌﾞﾗﾘを選択して､OKをｸﾘｯｸします。.

Trimble Geomatics Office は特徴ｺｰﾄﾞを処理します。処理された特徴ｺｰﾄﾞはｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに現れます。


逆数の表示

概要と詳細

2つのﾌﾟﾛｼﾞｪｸﾄﾎﾟｲﾝﾄ間の逆数を決定するには､

1.	測量/逆数を選択します。｢逆数｣ﾀﾞｲｱﾛｸﾞが現れ､ﾎﾟｲﾝﾀｰがﾌｨｰﾙﾄﾞ記入ﾎﾟｲﾝﾀｰになります。

2.	逆数計算に必要な最初のﾎﾟｲﾝﾄをｸﾘｯｸします。ﾎﾟｲﾝﾄ名が｢逆数｣ﾀﾞｲｱﾛｸﾞの｢始点｣ﾌｨｰﾙﾄﾞに現れます。

3.	逆数計算に必要な第二のﾎﾟｲﾝﾄをｸﾘｯｸします。ﾏｳｽがﾎﾟｲﾝﾄの上に置かれると､点線が現れます。

ﾎﾟｲﾝﾄ名が｢逆数｣ﾀﾞｲｱﾛｸﾞの｢終点｣ﾌｨｰﾙﾄﾞに現れ､逆数値が逆数ｸﾞﾙｰﾌﾟに自動的に表示されます。

ﾉｰﾄ:ｷｰﾎﾞｰﾄﾞを使用してﾌｨｰﾙﾄﾞにﾎﾟｲﾝﾄを入力した場合には､逆数を算出するために算出をｸﾘｯｸします。

4.	詳細をｸﾘｯｸして､この逆数算出における追加情報を表示します。詳細ｸﾞﾙｰﾌﾟは､ﾀﾞｲｱﾛｸﾞの一番下に付加され､逆算の追加情報を表示します。

5.	ﾚﾎﾟｰﾄに送るをｸﾘｯｸして､逆数のﾚﾎﾟｰﾄを生成します。使用される表示ｵﾌﾟｼｮﾝ（簡単か詳細）に従って､簡単か詳細ﾚﾎﾟｰﾄが作成されます。

6.	ﾚﾎﾟｰﾄを表示をｸﾘｯｸして､HTMLﾋﾞｭｰｱでﾚﾎﾟｰﾄを表示します。

7.	別の逆数を見るには､ﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞをｸﾘｯｸして､ﾎﾟｲﾝﾄを再び選択します。


ｴﾘｱの計測

計測ﾂｰﾙを使用して､現在の計測作業で選択された場所によって作成されたｴﾘｱと､最後の2ヵ所間の方位角と距離を表示します。

1.	測量/計測を選択します。｢計測｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳの最初の場所（ﾎﾟｲﾝﾄである必要はありません）をｸﾘｯｸします。

3.	ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで場所のｸﾘｯｸを続けます。場所を選択する度に､｢計測｣ﾀﾞｲｱﾛｸﾞのﾌｨｰﾙﾄﾞを計算するために座標が使用されます。選択した場所に連結するﾗｲﾝが現れます。

｢計測｣ﾀﾞｲｱﾛｸﾞのﾌｨｰﾙﾄﾞは､新しい場所をｸﾘｯｸするたびに更新されます。値はﾃﾞｰﾀﾍﾞｰｽ内に保管されません。

4.	値を取消すには､ﾘｾｯﾄをｸﾘｯｸします。


座標変換の実行

概要と詳細

選択したﾎﾟｲﾝﾄを転化したり回転したりするために座標変換を使用します。この例では､現存するﾎﾟｲﾝﾄに対する既知の座標を入力することによってﾃﾞｰﾀﾍﾞｰｽ内のすべてのﾎﾟｲﾝﾄを変換する方法を示します。

1.	変換､または回転を行いたいﾎﾟｲﾝﾄを選択します。

2.	測量/座標変換を選択します。｢座標変換｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	ﾎﾟｲﾝﾄ一覧をｸﾘｯｸします。｢座標変換－ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	以下の1つを行います。

ﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞで､現存するﾎﾟｲﾝﾄ名を入力します。

ﾎﾟｲﾝﾄを選択するためにﾌｨｰﾙﾄﾞ記入を使用します。ﾌｨｰﾙﾄﾞ記入を使用して､ﾎﾟｲﾝﾄを選択します。

｢ﾎﾟｲﾝﾄ｣ﾌｨｰﾙﾄﾞと｢現在の北距｣ﾌｨｰﾙﾄﾞ､｢現在の東距｣ﾌｨｰﾙﾄﾞは記入され､｢既知の北距｣ﾌｨｰﾙﾄﾞが選択されます。

5.	｢既知の北距｣と｢既知の東距｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾎﾟｲﾝﾄに対する既知の北距と東距を入力します。

ﾌｨｰﾙﾄﾞ記入を使用して､ﾎﾟｲﾝﾄの既知の北距と東距を選択します。

現在と既知の座標間の差を示すために､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳにﾗｲﾝが現れます。

統計ｸﾞﾙｰﾌﾟは縮尺係数と最大水平残差を示します。不良のﾎﾟｲﾝﾄﾍﾟｱを識別するためにこれらを使用します。

6.	OKをｸﾘｯｸします。残差ｴﾗｰを表示するﾀﾞｲｱﾛｸﾞが現れます。

7.	｢座標変換｣ﾀﾞｲｱﾛｸﾞに戻り､｢偏差北｣と｢偏差東｣ﾌｨｰﾙﾄﾞが現在と既知の座標から計算された値で記入されます。

8.	OKをｸﾘｯｸして､全体のﾃﾞｰﾀﾍﾞｰｽへの座標変換を適用します。

ﾉｰﾄ:座標変換を元に戻すことができます。


標高調整の実行

概要と詳細

標高調整を使用して､選択されたﾎﾟｲﾝﾄの標高を調整します。この例では､現存するﾎﾟｲﾝﾄに対して既知の標高を入力することによってﾃﾞｰﾀﾍﾞｰｽ内のﾎﾟｲﾝﾄすべての標高を調整する方法を示します。

1.	測量/標高調整を選択します。｢標高調整｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	ﾎﾟｲﾝﾄ一覧をｸﾘｯｸします。｢標高調整－ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	以下の1つを行います。

ﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞで､現存するﾎﾟｲﾝﾄ名を入力します。

ﾌｨｰﾙﾄﾞ記入を使用して､ﾎﾟｲﾝﾄを選択します。

選択されたﾎﾟｲﾝﾄの上にﾎﾞｯｸｽが現れます

｢ﾎﾟｲﾝﾄ｣と｢現在の北距｣､｢現在の東距｣､｢現在の標高｣は記入されます。

4.	以下の1つを行います。

｢既知の標高｣ﾌｨｰﾙﾄﾞで､ﾎﾟｲﾝﾄに対する既知の標高を入力します。

ﾌｨｰﾙﾄﾞ記入を使用して､別のﾎﾟｲﾝﾄの標高を選択します。

統計ｸﾞﾙｰﾌﾟは縮尺係数と最大調整傾斜角､最大垂直残差を示します。不良のﾎﾟｲﾝﾄﾍﾟｱを識別するためにこれらを使用します。

5.	OKをｸﾘｯｸして､｢標高調整｣ﾀﾞｲｱﾛｸﾞに戻ります。

｢原点北｣と｢原点東｣ﾌｨｰﾙﾄﾞには､使用された最初のﾎﾟｲﾝﾄからの座標が記入されます。｢補正定数｣ﾌｨｰﾙﾄﾞには､計算された標高調整が記入されます。｢北距単位当たりの補正｣と｢東距単位当たりの補正｣ﾌｨｰﾙﾄﾞは､標高調整を定義するのに1つ以上のﾎﾟｲﾝﾄが使用された場合にのみ記入されます。

6.	OKをｸﾘｯｸして､ﾃﾞｰﾀﾍﾞｰｽ全体に標高調整を適用します。

ﾉｰﾄ:座標変換を元に戻すことができます。


ﾌｨｰﾙﾄﾞｺｰﾄﾞの使用

概要と詳細

ﾌｨｰﾙﾄﾞｺｰﾄﾞを使用して､以下の値を表示します。

ﾌｨｰﾙﾄﾞ

注釈やﾚﾎﾟｰﾄ､ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄ､ﾃｷｽﾄの変数

ﾌｨｰﾙﾄﾞｺｰﾄﾞはﾚﾎﾟｰﾄやｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを定義するのにも便利です。この例ではﾌｨｰﾙﾄﾞｺｰﾄﾞを使用してｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを定義する方法を示します。ﾌｫｰﾏｯﾄは､ﾎﾟｲﾝﾄ名（大文字）と北距（単位と）､東距（単位と）､標高（単位と）を含むｶﾝﾏで区切られたﾃｷｽﾄﾌｧｲﾙを定義します。

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	ｶｽﾀﾑﾀﾌﾞで､新規をｸﾘｯｸします。｢ASCIIｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢名前｣ﾌｨｰﾙﾄﾞに名前を入力します。

4.	本文ﾌｫｰﾏｯﾄﾌｨｰﾙﾄﾞで右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/名前を選択します。

本文ﾌｫｰﾏｯﾄﾎﾞｯｸｽに[名前]が現れます。

5.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌｨｰﾙﾄﾞ/高度/修飾子/大文字を選択します。

[名前:大文字]が本文ﾌｫｰﾏｯﾄﾎﾞｯｸｽに現れます。これは､すべてのﾎﾟｲﾝﾄ名に含まれるあらゆる文字が大文字でｴｸｽﾎﾟｰﾄされることを意味します。

6.	ｶﾝﾏ､そしてｽﾍﾟｰｽを入力します。

7.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌｨｰﾙﾄﾞ/北距を選択します。

ｶﾝﾏの脇に[北距]が現れます。

8.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌｨｰﾙﾄﾞ/高度/修飾子/単位を選択します。

[北距]が[北距:単位]に変わります。これは､現在の座標単位がﾌｧｲﾙに含まれたことを意味します。

9.	ｶﾝﾏ､そしてｽﾍﾟｰｽを入力します。

10.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽし､ﾌｨｰﾙﾄﾞ/東距を選択します。

ｶﾝﾏの脇に[東距]が現れます。

11.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/高度/修飾子/単位を選択します。

[東距]が[東距:単位]に変わります。これは､現在の座標単位がﾌｧｲﾙに含まれたことを意味します。

12.	ｶﾝﾏ､そしてｽﾍﾟｰｽを入力します。

13.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/標高を選択します。

ｶﾝﾏの脇に[標高]が現れます。

14.	右ｸﾘｯｸして､ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌｨｰﾙﾄﾞ/高度/修飾子/単位を選択します。

[標高]が[標高:単位]に変わります。これは､現在の座標単位がﾌｧｲﾙに含まれたことを意味します。

15.	OKをｸﾘｯｸして､ｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを保存します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。作成したﾌｫｰﾏｯﾄが､ｶｽﾀﾑﾀﾌﾞの一覧に現れます。

16.	このﾌｫｰﾏｯﾄでﾃﾞｰﾀをｴｸｽﾎﾟｰﾄするには､ﾌｫｰﾏｯﾄを選択して､OKをｸﾘｯｸします。｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

17.	｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞで､ｴｸｽﾎﾟｰﾄﾌｧｲﾙに対する名前を入力します。

18.	保存をｸﾘｯｸしてﾌｧｲﾙを作成します。


ﾌｨｰﾙﾄﾞ記入の使用

概要と詳細

ﾌｨｰﾙﾄﾞ記入を使用して､ﾃﾞｰﾀﾍﾞｰｽに現存するｴﾝﾃｨﾃｨからﾌｨｰﾙﾄﾞに対する値を入力します。ﾌｨｰﾙﾄﾞ記入を利用できる場合には､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳにﾌｨｰﾙﾄﾞ記入ﾎﾟｲﾝﾀｰが現れます。この例では､ﾃｷｽﾄｴﾝﾃｨﾃｨを追加する時の座標選択にﾌｨｰﾙﾄﾞ記入を使用します。

1.	挿入/ﾃｷｽﾄを選択します。｢ﾃｷｽﾄの挿入｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢ﾃｷｽﾄ表現｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄを入力します。

3.	｢北距｣ﾌｨｰﾙﾄﾞを選択します。

4.	ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳにﾎﾟｲﾝﾀｰを置くと､ﾌｨｰﾙﾄﾞ記入ﾎﾟｲﾝﾀｰが現れます。

5.	ﾃｷｽﾄに現れて欲しいｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳ内の場所をｸﾘｯｸします。座標は､｢北距｣と｢東距｣ﾌｨｰﾙﾄﾞに記入されます。

6.	OKをｸﾘｯｸして､ﾃﾞｰﾀﾍﾞｰｽにﾃｷｽﾄを追加します。

ﾋﾝﾄ:観測の時間を入力するのにﾌｨｰﾙﾄﾞ記入を使用することができます。（観測をｸﾘｯｸすることで）


ﾍﾟｰｼﾞ設定をｸﾞﾗﾌｨｯｸｽで設定

概要と詳細

1.	ﾌｧｲﾙ/ﾍﾟｰｼﾞ設定を選択します。｢ﾍﾟｰｼﾞ設定｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	適合度をｸﾘｯｸします。

3.	｢原点北｣か｢原点東｣ﾌｨｰﾙﾄﾞをｸﾘｯｸします。ﾌｨｰﾙﾄﾞ記入ﾎﾟｲﾝﾀｰが現れます。

4.	図面ｴﾘｱの左上の角になって欲しい場所を､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳ内でｸﾘｯｸします。

5.	選択した平面図でﾌﾟﾛｼﾞｪｸﾄﾃﾞｰﾀに一番適合する回転を設定します。

6.	ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで､ﾌﾟﾛｼﾞｪｸﾄﾃﾞｰﾀ上の図面ﾎﾞｯｸｽをｸﾘｯｸしてﾄﾞﾗｯｸﾞします。

7.	縮尺を標準値に変更します。例えば､図面の適合度が1:435の場合には､それは1:500に変更します。

8.	OKをｸﾘｯｸして､｢ﾍﾟｰｼﾞ設定｣設定を適用します。


ﾌﾟﾛｼﾞｪｸﾄに対してｼﾞｵｲﾄﾞﾓﾃﾞﾙを選択

概要と詳細

ﾌﾟﾛｼﾞｪｸﾄに対してｼﾞｵｲﾄﾞﾓﾃﾞﾙを選択するには､座標系ｳｨｻﾞｰﾄﾞを使用します。現在の座標系に対するｼﾞｵｲﾄﾞﾓﾃﾞﾙを変更したい場合にもこれが適用します。

1.	ﾌｧｲﾙ/ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択します。｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	座標系ﾀﾌﾞを選択します。

3.	座標系設定ｸﾞﾙｰﾌﾟで､変更をｸﾘｯｸします。｢座標系の選択｣ﾀﾞｲｱﾛｸﾞ が現れます。

4.	｢新しい座標系｣ｵﾌﾟｼｮﾝを選択して､次へをｸﾘｯｸします。｢座標系ﾀｲﾌﾟの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	適切な座標系ﾀｲﾌﾟを選択します。座標系選択ｳｨｻﾞｰﾄﾞの最後に｢ｼﾞｵｲﾄﾞﾓﾃﾞﾙの選択｣ﾀﾞｲｱﾛｸﾞが現れます。必要なｼﾞｵｲﾄﾞﾓﾃﾞﾙを選択します。利用可能なｼﾞｵｲﾄﾞﾓﾃﾞﾙの一覧は､座標系ﾃﾞｰﾀﾍﾞｰｽから読み込まれます。座標系に対する標準ｼﾞｵｲﾄﾞﾓﾃﾞﾙは標準によって選択されます。

6.	6.	終了をｸﾘｯｸします。

選択するｼﾞｵｲﾄﾞﾓﾃﾞﾙは､ﾌﾟﾛｼﾞｪｸﾄに適用します。

ﾉｰﾄ:Coordinate System Managerﾕｰﾃｨﾘﾃｨを使用して､座標系に対する標準ｼﾞｵｲﾄﾞﾓﾃﾞﾙを選択することができます。


属性を持つﾎﾟｲﾝﾄのﾌﾟﾛｼﾞｪｸﾄ間での切り取りとｺﾋﾟｰ

概要と詳細

1.	ｿｰｽﾌﾟﾛｼﾞｪｸﾄから､宛先ﾌﾟﾛｼﾞｪｸﾄへｺﾋﾟｰしたいﾎﾟｲﾝﾄを選択します。選択/ﾎﾟｲﾝﾄ特徴でｺﾏﾝﾄﾞ（計画表示で利用可能）を使用して､特定する特徴を持つﾎﾟｲﾝﾄを選択します。

2.	新しいﾌﾟﾛｼﾞｪｸﾄに必要なﾎﾟｲﾝﾄをｺﾋﾟｰするには､編集/ｺﾋﾟｰを選択します。

3.	宛先ﾌﾟﾛｼﾞｪｸﾄで､ﾎﾟｲﾝﾄを貼り付けるために編集/貼り付けを選択します。

4.	属性の定義が２つのﾌﾟﾛｼﾞｪｸﾄで異なる場合には､ﾀﾞｲｱﾛｸﾞが現れます。

5.	はいをｸﾘｯｸして､両方の特徴･属性ﾗｲﾌﾞﾗﾘに共通なﾃﾞｰﾀを貼り付けます。貼り付けされない属性ﾃﾞｰﾀのすべては､貼り付け.rptﾚﾎﾟｰﾄに記録されます。このﾚﾎﾟｰﾄは､貼り付けているﾌﾟﾛｼﾞｪｸﾄのﾚﾎﾟｰﾄﾌｫﾙﾀﾞに保管されます。

ﾉｰﾄ:ﾌﾟﾛｼﾞｪｸﾄ間で切り取ったり貼り付けたりできるのはﾎﾟｲﾝﾄだけです。ﾎﾟｲﾝﾄを位置付けるのに観測が使用される場合には､その後引き出される座標はｺﾋﾟｰされます。ﾎﾟｲﾝﾄがGPS座標と観測から引き出されている場合には､その後WGS-84座標がｺﾋﾟｰされます。このｺﾋﾟｰされるWGS-84座標は新しいﾌﾟﾛｼﾞｪｸﾄのGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝとして使用されることができます。


ﾎﾟｲﾝﾄに属性の追加

概要と詳細

属性を追加するには､属性に対するﾌﾟﾛｼﾞｪｸﾄを設定しなければなりません。

1.	属性を追加したいﾎﾟｲﾝﾄを選択します。これを行うには､以下の1つを使用します。

ﾏｳｽ

選択ﾒﾆｭｰ

2.	ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを開きます。

3.	属性ﾀﾌﾞで､｢ﾍﾟｰｼﾞﾒﾆｭｰ｣ｱｲｺﾝ [image] をｸﾘｯｸします。ｼｮｰﾄｶｯﾄﾒﾆｭｰが現れます。

4.	挿入をｸﾘｯｸします。属性を持つ利用可能な特徴ｺｰﾄﾞの一覧が現れます。

5.	追加したい､属性を持つ特徴ｺｰﾄﾞを選択します。選択された特徴ｺｰﾄﾞに対する属性が現れます。

6.	それぞれの属性に対する値を入力します。Trimble Geomatics Office は､入力する値すべてをﾁｪｯｸします。このﾁｪｯｸは､属性を設定するために使用された特徴･属性ﾗｲﾌﾞﾗﾘに対して値が有効かどうかを確認するためのものです。

7.	ﾎﾟｲﾝﾄに追加したいその他の特徴ｺｰﾄﾞに対して上記のｽﾃｯﾌﾟを繰り返します。


属性の表示

概要と詳細

1.	ﾎﾟｲﾝﾄを選択します。これを行うには､以下の1つを使用します。

ﾏｳｽ

選択ﾒﾆｭｰ

2.	ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを開きます。

3.	属性ﾀﾌﾞを選択します。

一回に1つの属性を持つ特徴ｺｰﾄﾞしか表示することはできません。別の属性を持つ特徴ｺｰﾄﾞを表示するには､ﾄﾞﾛｯﾌﾟﾀﾞｳﾝ一覧を使用します。

ﾉｰﾄ: ｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞ / 特徴ﾀﾌﾞから､ﾌﾟﾛｼﾞｪｸﾄに対して特徴･属性ﾗｲﾌﾞﾗﾘを設定するときにのみ､属性ﾀﾌﾞが現れます。


属性の編集

概要と詳細

1.	属性をｸﾘｯｸします。属性がﾒﾆｭｰの場合には､矢印がﾌｨｰﾙﾄﾞの右側に現れます。

2.	矢印をｸﾘｯｸすると､属性に対するﾒﾆｭｰｵﾌﾟｼｮﾝの一覧が表示されます。

その他の属性ﾀｲﾌﾟのすべては､ｷｰﾎﾞｰﾄﾞからの入力を必要とします。

ﾉｰﾄ:属性情報を編集する時､有効な値が入力されたことを確認するために､Trimble Geomatics Office は特徴･属性ﾗｲﾌﾞﾗﾘの定義をﾁｪｯｸします。


ﾗｲﾝの挿入

概要と詳細

1.	計画表示を選択します。以下の1つを行います。

表示/計画を選択します。

計画表示ﾂｰﾙをｸﾘｯｸします。

Altと2を同時に押します。

2.	以下の1つを行います。

挿入/ﾗｲﾝを選択します。

｢ﾗｲﾝを挿入｣ﾂｰﾙを選択します。

選択されたﾗｲﾝﾀﾌﾞと一緒に｢ﾗｲﾝﾜｰｸの挿入｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢始点｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､ﾗｲﾝを定義するために必要な最初のﾎﾟｲﾝﾄを選択します。

ﾗｲﾝを定義するために必要な最初のﾎﾟｲﾝﾄに対するﾎﾟｲﾝﾄ名を入力します。

4.	｢終点｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､ﾗｲﾝを定義するために必要な第二のﾎﾟｲﾝﾄを選択します。

ﾗｲﾝを定義するために必要な第二のﾎﾟｲﾝﾄに対するﾎﾟｲﾝﾄ名を入力します。

5.	｢ﾚｲﾔｰ｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾗｲﾝを追加したいﾚｲﾔｰを選択します。

新しいﾚｲﾔｰを作成するために新しいﾚｲﾔｰ名を入力します。

6.	｢ﾗｲﾝｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで､ﾗｲﾝを表示するのに必要なﾗｲﾝｽﾀｲﾙを選択します。

7.	ﾗｲﾝを追加するために､以下の1つを行います。

挿入をｸﾘｯｸします。

Enter を押します。

｢終点｣ﾌｨｰﾙﾄﾞで選択されたﾎﾟｲﾝﾄが､｢始点｣ﾌｨｰﾙﾄﾞに現れます。｢始点｣ﾌｨｰﾙﾄﾞに再入力することなくﾗｲﾝの追加を継続できます。

ﾗｲﾝがｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに現れます。（ﾗｲﾝに対して選択されたﾚｲﾔｰはその表示ﾌﾟﾛﾊﾟﾃｨがｵﾝになっている必要があります。）

8.	ﾗｲﾝの挿入を終了するには､閉じるをｸﾘｯｸします。


曲線の挿入

概要と詳細

1.	計画表示を選択します。以下の1つを行います。

表示/計画を選択します。

計画表示ﾂｰﾙをｸﾘｯｸします。

Altと2を同時に押します。

2.	挿入/曲線を選択します。｢ﾗｲﾝﾜｰｸの挿入｣ﾀﾞｲｱﾛｸﾞが､選択された曲線ﾀﾌﾞと一緒に現れます

3.	｢始点｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､適切なﾎﾟｲﾝﾄをｸﾘｯｸします。

ﾎﾟｲﾝﾄ名を入力するのにｷｰﾎﾞｰﾄﾞを使用します。

4.	｢終点｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､適切なﾎﾟｲﾝﾄをｸﾘｯｸします。

ﾎﾟｲﾝﾄ名を入力するのにｷｰﾎﾞｰﾄﾞを使用します。

5.	｢入射角｣と｢出射角｣ﾌｨｰﾙﾄﾞで､曲線を定義するのに使用されるﾎﾟｲﾝﾄを基礎とした射角値を自動的に入力するためには値を<自動>のまま残します。

6.	｢曲率｣ﾌｨｰﾙﾄﾞで､0と1の間の値を入力します。曲率は曲線の幅を定義します。曲率が高いほど､曲線の幅が大きくなります。

7.	｢ﾚｲﾔｰ｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

曲線を追加したいﾚｲﾔｰを選択します。

新しいﾚｲﾔｰを作成するために新しいﾚｲﾔｰの名前を入力します。

8.	｢ﾗｲﾝｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで､曲線を表示するために必要とするﾗｲﾝｽﾀｲﾙを選択します。

9.	曲線を追加するために､以下の1つを行います。

挿入をｸﾘｯｸします。

Enter を押します。.

曲線がｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに現れます。（曲線に対して選択されたﾚｲﾔｰは､その表示ﾌﾟﾛﾊﾟﾃｨがｵﾝになっている必要があります。）他の曲線で使用されているﾎﾟｲﾝﾄから曲線を追加する度に､滑らかな曲線が表示されることを確実にするために､Trimble Geomatics Office は現存する曲線を再計算します

10.	曲線の挿入を終了するために､閉じるをｸﾘｯｸします。


円弧の挿入

概要と詳細

1.	計画表示を選択します。以下の1つを行います。

表示/計画を選択します。

計画表示ﾂｰﾙをｸﾘｯｸします。

Alt+2を選択します。

2.	挿入/円弧を選択します。｢ﾗｲﾝﾜｰｸの挿入｣ﾀﾞｲｱﾛｸﾞが､選択された円弧ﾀﾌﾞと一緒に現れます。

3.	｢始点｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､適切なﾎﾟｲﾝﾄをｸﾘｯｸします。

ｷｰﾎﾞｰﾄﾞを使用して､ﾎﾟｲﾝﾄ名を入力します。

4.	｢終点｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用して､適切なﾎﾟｲﾝﾄををｸﾘｯｸします。

ｷｰﾎﾞｰﾄﾞを使用して､ﾎﾟｲﾝﾄ名を入力します。

5.	｢中心点｣ﾌｨｰﾙﾄﾞで､円弧の中心として現存するﾎﾟｲﾝﾄを使用するには､以下の1つを行います。

現存するﾎﾟｲﾝﾄの名前を入力します。

ﾌｨｰﾙﾄﾞ記入を使用して､現存するﾎﾟｲﾝﾄを選択します。

ﾎﾟｲﾝﾄに対する座標は､｢中心の北距｣と｢中心の東距｣ﾌｨｰﾙﾄﾞにｺﾋﾟｰされます。

6.	｢中心の北距｣と｢中心の東距｣ﾌｨｰﾙﾄﾞで､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳ内のある場所をｸﾘｯｸして､座標を円弧の中心として使用します。座標はこれらのﾌｨｰﾙﾄﾞにｺﾋﾟｰされます。

中心点と中心座標の両方を入力する場合には､中心点が使用されます。

7.	｢小さい円弧｣ﾌｨｰﾙﾄﾞで､大きな円弧を作成したい時には､｢偽｣ｵﾌﾟｼｮﾝを選択します。または､｢真｣を選択します。2つのﾎﾟｲﾝﾄ間には常に可能性のある円弧が2つあり､それが一緒になって円を定義します。この設定はどの円弧を描きたいかを定義します。

8.	｢ﾚｲﾔｰ｣ﾌｨｰﾙﾄﾞで､以下の1つを行います。

円弧を追加したいﾚｲﾔｰを選択します。

新しいﾚｲﾔｰを作成するために新しいﾚｲﾔｰの名前を入力します。

9.	｢ﾗｲﾝｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで､円弧を表示するために必要とするﾗｲﾝｽﾀｲﾙを選択します。

10.	円弧を表示するために､以下の1つを行います。

挿入をｸﾘｯｸします。

Enter を押します。.

円弧がｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに現れます。（円弧に対して選択されたﾚｲﾔｰは､その表示ﾌﾟﾛﾊﾟﾃｨがｵﾝになっている必要があります。）

11.	円弧の挿入を終了するために､閉じるをｸﾘｯｸします。


ﾃｷｽﾄの挿入

概要と詳細

1.	計画表示を選択します。以下の1つを行います。

表示/計画を選択します。

計画表示ﾂｰﾙをｸﾘｯｸします。

Altと2を同時に押します。

2.	以下の1つを行います。

挿入/ﾃｷｽﾄを選択します。

｢ﾃｷｽﾄの挿入｣ﾂｰﾙをｸﾘｯｸします。

｢ﾃｷｽﾄの挿入｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢ﾃｷｽﾄ表現｣ﾌｨｰﾙﾄﾞで､表示したいﾃｷｽﾄを入力します。ﾌｨｰﾙﾄﾞｺｰﾄﾞ（例､ﾌﾟﾛｼﾞｪｸﾄﾀｲﾄﾙ）を使用するには､ｼｮｰﾄｶｯﾄﾒﾆｭｰを見るために右ｸﾘｯｸして､｢ﾌｨｰﾙﾄﾞ｣を選択します。

4.	｢北距｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄの場所に対する北距値を入力します。または､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳでその場所をｸﾘｯｸすることで､ﾌｨｰﾙﾄﾞ記入を使用します。

5.	｢東距｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄの場所に対する東距値を入力します。または､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳでその場所をｸﾘｯｸすることで､ﾌｨｰﾙﾄﾞ記入を使用します。

6.	｢方位ｵﾌｾｯﾄ｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄｴﾝﾃｨﾃｨに対する方位ｵﾌｾｯﾄを入力します。方位ｵﾌｾｯﾄを特定しない場合には､ﾃｷｽﾄはｳｨﾝﾄﾞｳを横断して水平に表示されます。

7.	｢固定ﾀｲﾌﾟ｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄが存在する場所を北距値と東距値に対応して特定し､一覧から値を選択します。

8.	｢ﾚｲﾔｰ｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄを追加したいﾚｲﾔｰを一覧から選択します。新しいﾚｲﾔｰにﾃｷｽﾄを入力するには､新しい名前を入力します。

9.	｢ﾃｷｽﾄｽﾀｲﾙ｣ﾌｨｰﾙﾄﾞで､ﾃｷｽﾄｴﾝﾃｨﾃｨのﾃｷｽﾄｽﾀｲﾙを一覧から選択します。ﾃｷｽﾄを追加しようとしているﾚｲﾔｰに対して設定された標準ﾃｷｽﾄｽﾀｲﾙを必要とする場合には､｢ﾚｲﾔｰで｣ｵﾌﾟｼｮﾝを選択します。

10.	挿入をｸﾘｯｸして､ﾃﾞｰﾀﾍﾞｰｽにﾃｷｽﾄを追加し､更にﾃｷｽﾄを追加するためにﾀﾞｲｱﾛｸﾞを開いたままにします。

11.	ﾃｷｽﾄの挿入を終了するために､閉じるをｸﾘｯｸします。


新しいﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄの作成

概要と詳細

1.	以下の1つを行います。

｢新規｣ﾂｰﾙをｸﾘｯｸします。

ﾌｧｲﾙ/新しいﾌﾟﾛｼﾞｪｸﾄを選択します。

｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢新規｣ｸﾞﾙｰﾌﾟで､ﾃﾝﾌﾟﾚｰﾄｵﾌﾟｼｮﾝを選択します。｢詳細｣ｸﾞﾙｰﾌﾟ内のﾌﾟﾛｼﾞｪｸﾄﾌｫﾙﾀﾞは､標準ﾃﾝﾌﾟﾚｰﾄﾌｫﾙﾀﾞに変更します。

3.	｢名前｣ﾌｨｰﾙﾄﾞで､ﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄの名前を入力します。

4.	｢ﾃﾝﾌﾟﾚｰﾄ｣ﾌｨｰﾙﾄﾞで､一覧からﾃﾝﾌﾟﾚｰﾄを選択して､OKをｸﾘｯｸします。｢ﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨ｣ﾀﾞｲｱﾛｸﾞが現れます。

5.	このﾃﾝﾌﾟﾚｰﾄを標準として使用するﾌﾟﾛｼﾞｪｸﾄすべてを見つけようとしているﾌﾟﾛｼﾞｪｸﾄﾌﾟﾛﾊﾟﾃｨを選択して､OKをｸﾘｯｸします。.

ﾒｯｾｰｼﾞが現れます。ﾃﾝﾌﾟﾚｰﾄで作業を続ける場合には､はいをｸﾘｯｸします。ﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄを閉じる場合には､いいえをｸﾘｯｸします。

6.	はいを選択した場合には､そのﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄで作業を続けることができます。ﾌﾟﾛｼﾞｪｸﾄﾃﾝﾌﾟﾚｰﾄでの作業を終了するには､ﾌｧｲﾙ / 閉じる を選択します。

7.	新しいﾌﾟﾛｼﾞｪｸﾄを作成すると､｢新しいﾌﾟﾛｼﾞｪｸﾄ｣ﾀﾞｲｱﾛｸﾞのﾃﾝﾌﾟﾚｰﾄ一覧から新しいﾃﾝﾌﾟﾚｰﾄを見つけることができます。


ﾎﾟｲﾝﾄｽﾀｲﾙの作成

概要と詳細

1.	計画表示で､編集/ｽﾀｲﾙを選択します。｢CADｽﾀｲﾙ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢ﾎﾟｲﾝﾄｽﾀｲﾙ｣ﾀﾌﾞで､新規をｸﾘｯｸします。｢ﾎﾟｲﾝﾄｽﾀｲﾙの作成｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢ﾎﾟｲﾝﾄｽﾀｲﾙの作成｣ﾀﾞｲｱﾛｸﾞを完成します。

OKをｸﾘｯｸします。

ﾎﾟｲﾝﾄｽﾀｲﾙがﾃﾞｰﾀﾍﾞｰｽに追加されます。それが､｢CADｽﾀｲﾙ｣ﾀﾞｲｱﾛｸﾞ － ﾎﾟｲﾝﾄｽﾀｲﾙﾀﾌﾞに現れます。


ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを開く

概要と詳細

以下の1つを行います。

編集/ﾌﾟﾛﾊﾟﾃｨを選択します。

｢ﾌﾟﾛﾊﾟﾃｨの編集｣ﾂｰﾙ [image] をｸﾘｯｸします。

ｼｮｰﾄｶｯﾄﾒﾆｭｰからﾌﾟﾛﾊﾟﾃｨを選びます。

ｸﾞﾗﾌｨｯｸｴﾝﾃｨﾃｨをﾀﾞﾌﾞﾙｸﾘｯｸします。

AltとEnterを同時に押します。


Trimble Survey Controller にﾃﾞ－ﾀ辞書ﾌｧｲﾙ(.ddf)のｴｸｽﾎﾟ－ﾄ
Trimble Survey Controller にﾃﾞｰﾀ辞書ﾌｧｲﾙ(.ddf)のｴｸｽﾎﾟｰﾄ

概要と詳細

ﾉｰﾄ:Trimble Survey Controller のﾊﾞｰｼﾞｮﾝ7.00以降を使用している装置にしか.ddfﾌｧｲﾙの転送はできません。

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢ﾃﾞｰﾀ辞書ﾌｧｲﾙをSurvey Controller(*.ddf)へ｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢選択｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	Trimble Survey Controller に転送したいﾌｧｲﾙを選択して､開くをｸﾘｯｸします。｢保存｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	Survey Controller装置を選択して､開くをｸﾘｯｸします。｢接続｣ﾀﾞｲｱﾛｸﾞが現れます。

装置への接続が確立されると､ﾒｲﾝﾒﾓﾘ(C:)がﾎﾞｯｸｽに現れます。装置に現在PCｶｰﾄﾞが挿入されている場合には､PCｶｰﾄﾞ(A:)も表示されます。

ﾉｰﾄ:お手持ちのTrimble装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

5.	以下の1つを行います。

ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller のﾒｲﾝﾒﾓﾘのﾌｧｲﾙに保存します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞにﾌｧｲﾙを保存したい場合にはPCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

6.	開くをｸﾘｯｸします。ﾒｲﾝﾒﾓﾘかPCｶｰﾄﾞが読み込まれます。現存するﾃﾞｰﾀ辞書ﾌｧｲﾙが表示されます。

7.	｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞで､ｴｸｽﾎﾟｰﾄするように選択した.ddfﾌｧｲﾙの内部名が現れます。これは､Trimble Survey Controller に見られる名前です。

8.	必要に応じてこの名前を編集します。

9.	保存をｸﾘｯｸします。｢読込み中｣ﾀﾞｲｱﾛｸﾞが現れ､進行状況ﾊﾞｰが転送の進行状況を示します。

転送が完了すると､｢読込み中｣ﾀﾞｲｱﾛｸﾞは消え､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに戻ります。ここで.ddfﾌｧｲﾙがTrimble Survey Controller で使用できるようになります。

ﾉｰﾄ:Trimble Survey Controllerﾊﾞｰｼﾞｮﾝ7.60 から/へﾃﾞｰﾀを転送する場合には､ﾊﾞｰｼﾞｮﾝ7.50.dcﾌｧｲﾙﾌｫｰﾏｯﾄを使用します。


ﾌﾟﾛｼﾞｪｸﾄに.dcﾌｧｲﾙをﾄﾞﾗｯｸﾞ･ﾄﾞﾛｯﾌﾟ
ﾌﾟﾛｼﾞｪｸﾄにﾌｧｲﾙをﾄﾞﾗｯｸﾞ･ﾄﾞﾛｯﾌﾟ

概要と詳細

ﾌｧｲﾙをﾌﾟﾛｼﾞｪｸﾄにﾄﾞﾗｯｸﾞ･ﾄﾞﾛｯﾌﾟするには､

1.	ﾌｧｲﾙを転送するためにTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄを開きます。

2.	Microsoft を開きます。詳細に関しては､ｵﾍﾟﾚｰﾃｨﾝｸﾞｼｽﾃﾑのﾏﾆｭｱﾙを参考にしてください。

3.	ｲﾝﾎﾟｰﾄするﾌｧｲﾙを含むﾌｫﾙﾀﾞの場所を探し出します。

4.	ｲﾝﾎﾟｰﾄするﾌｧｲﾙを右ｸﾘｯｸします。

5.	Trimble Geomatics Officeｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳにﾌｧｲﾙをﾄﾞﾗｯｸﾞします。

6.	ｼｮｰﾄｶｯﾄﾒﾆｭｰを見るために右ﾎﾞﾀﾝを解放します。

7.	適切なﾌｧｲﾙｵﾌﾟｼｮﾝを選択します。

8.	左ｸﾘｯｸします。ﾌｧｲﾙがｲﾝﾎﾟｰﾄされました。

ｲﾝﾎﾟｰﾄ中に起こる可能性のある情報に関しては､ｲﾝﾎﾟｰﾄ－概要を参照します。ﾌｧｲﾙは､そのﾌﾟﾛｼﾞｪｸﾄに対するﾃﾞｰﾀﾌｧｲﾙﾌｫﾙﾀﾞかTrimbleﾌｧｲﾙﾌｫﾙﾀﾞに保管されます。


ﾎﾟｲﾝﾄを名前で選択

1.	選択/ﾎﾟｲﾝﾄを選択します。｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	一般ﾀﾌﾞを選択します。

3.	｢名前の一致｣ﾌｨｰﾙﾄﾞで､選択したいﾎﾟｲﾝﾄ名を入力します。複数のﾎﾟｲﾝﾄを選択するために範囲とﾜｲﾙﾄﾞｶｰﾄﾞ文字を使用します。

4.	OKをｸﾘｯｸします。入力された名前と一致するﾎﾟｲﾝﾄが選択されます。ｽﾃｰﾀｽﾊﾞｰは､選択されたﾎﾟｲﾝﾄの数を示します。

ﾉｰﾄ:｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞを使用する前に現在選択されているすべてのｴﾝﾃｨﾃｨは､｢現在の選択に付加｣ﾁｪｯｸﾎﾞｯｸｽが選択されていなければ､選択ｾｯﾄ内に保持されません。


ﾎﾟｲﾝﾄをﾎﾟｲﾝﾄの質で選択

1.	選択/ﾎﾟｲﾝﾄを選択します。｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	一般ﾀﾌﾞを選択します。

3.	｢ﾎﾟｲﾝﾄの質で｣ﾌｨｰﾙﾄﾞで､選択したい要素と質の組み合わせを選択します。一覧から複数のｴﾝﾄﾘを選択できます。

4.	OKをｸﾘｯｸします。

選択に一致するﾎﾟｲﾝﾄが選択されます。ｽﾃｰﾀｽﾊﾞｰは選択されたﾎﾟｲﾝﾄ数を示します。

ﾉｰﾄ:｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞを使用する前に現在選択されているすべてのｴﾝﾃｨﾃｨは､｢現在の選択に付加｣ﾁｪｯｸﾎﾞｯｸｽが選択されていなければ､選択ｾｯﾄ内に保持されません。


選択されたﾎﾟｲﾝﾄから観測を選択

1.	測量表示で､選択/観測を選択します。｢観測の選択｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢始点｣ﾌｨｰﾙﾄﾞで､ﾎﾟｲﾝﾄ名を入力するか､選択内で複数ﾎﾟｲﾝﾄを使用する範囲を入力します。ﾌｨｰﾙﾄﾞ記入とﾜｲﾙﾄﾞｶｰﾄﾞを使用することができます。

3.	OKをｸﾘｯｸします。.

選択に一致するﾎﾟｲﾝﾄからの観測が選択されます。ｽﾃｰﾀｽﾊﾞｰは選択された観測数を示します。

ﾉｰﾄ:｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞを使用する前に現在選択されているすべてのｴﾝﾃｨﾃｨは､｢現在の選択に付加｣ﾁｪｯｸﾎﾞｯｸｽが選択されていなければ､選択ｾｯﾄ内に保持されません。


観測を無効にする

1.	測量表示から､観測を選択します。

2.	以下の1つを行います。

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを開きます。要旨ｱｲｺﾝ [image] をｸﾘｯｸして､｢ｽﾃｰﾀｽ｣ﾌｨｰﾙﾄﾞから｢無効にする｣ｵﾌﾟｼｮﾝを選択します。

編集/観測の有効･無効を選択します。

ﾉｰﾄ: 観測を無効にすると､測量情報を更新するために再算出を行います。ﾎﾟｲﾝﾄを移動すると､それに対する観測のすべては自動的に無効になります。


Trimble Survey Controller からTrimble Geomatics Office へのｼﾞｮﾌﾞのｲﾝﾎﾟ－ﾄ
Trimble Survey Controller からTrimble Geomatics Office へのｼﾞｮﾌﾞのｲﾝﾎﾟｰﾄ

1.	以下の1つを行います。

ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。

ｲﾝﾎﾟｰﾄﾂｰﾙをｸﾘｯｸします。

2.	測量ﾀﾌﾞで､測量装置ｵﾌﾟｼｮﾝを選択します。｢ﾃﾞｰﾀ転送を開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	Trimble Survey Controller装置を選択します。

4.	開くをｸﾘｯｸします。｢接続｣ﾀﾞｲｱﾛｸﾞが現れます。接続が確立されると､｢開く｣ﾀﾞｲｱﾛｸﾞは更新され､選択した装置が表示されます。

5.	以下のｵﾌﾟｼｮﾝの1つから転送したいﾌｧｲﾙを選択します。

Trimble Survey Controller のﾒｲﾝﾒﾓﾘに保管されるﾌｧｲﾙに対するﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝ

Survey Controllerに挿入されたPCｶｰﾄﾞ内に保管されるﾌｧｲﾙに対するPCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝ

ﾉｰﾄ:お手持ちのTrimble装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

6.	開くをｸﾘｯｸします。｢受取り中｣ﾀﾞｲｱﾛｸﾞが現れ､進行状況ﾊﾞｰが転送の進行状況を示します。転送が完了すると､｢受取り中｣ﾀﾞｲｱﾛｸﾞは消え､装置への接続は切断されます。


ﾂｰﾙﾊﾞｰの表示（または非表示）

1.	以下の1つを行います。

ﾂｰﾙﾊﾞｰｴﾘｱで右ｸﾘｯｸします。ｼｮｰﾄｶｯﾄﾒﾆｭｰが現れます。

表示/ﾂｰﾙﾊﾞｰを選択します。ﾒﾆｭｰが現れます。

利用可能なﾂｰﾙﾊﾞｰの一覧が現れます。現在表示されているそれぞれのﾂｰﾙﾊﾞｰにはその名前の脇にﾁｪｯｸﾏｰｸが付けられています。

2.	必要とするﾂｰﾙﾊﾞｰを選択します。Trimble Geomatics Officeのｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳからﾂｰﾙﾊﾞｰが消えます。（または､再現されます。）

3.	再びﾂｰﾙﾊﾞｰを表示するには､上記のｽﾃｯﾌﾟを繰り返します。


Trimble Survey Controller にｱﾝﾃﾅ詳細を転送

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､｢ｱﾝﾃﾅ詳細をSurvey Controllerへ｣ｵﾌﾟｼｮﾝを選択します。｢ﾃﾞｰﾀ転送､名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	Trimble Survey Controller装置を選択して､開くをｸﾘｯｸします。｢接続｣ﾀﾞｲｱﾛｸﾞが現れます。接続が行われると､｢保存｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	以下の1つを行います。

ﾒｲﾝﾒﾓﾘ(C:)ｵﾌﾟｼｮﾝを選択して､Trimble Survey Controller のﾒｲﾝﾒﾓﾘのﾌｧｲﾙに保存します。

PCｶｰﾄﾞを挿入してあり､PCｶｰﾄﾞにﾌｧｲﾙを保存したい場合には､PCｶｰﾄﾞ(A:)ｵﾌﾟｼｮﾝを選択します。

ﾉｰﾄ:お手持ちの装置がPCｶｰﾄﾞを持たない場合には､このﾀﾞｲｱﾛｸﾞを利用できません。

5.	開くをｸﾘｯｸします。選択したﾃﾞｨﾚｸﾄﾘが読み込まれます。ﾃﾞｨﾚｸﾄﾘ内のすべてのSurvey Controllerﾌｧｲﾙが表示されます。｢ﾌｧｲﾙ名｣ﾌｨｰﾙﾄﾞにTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄ名が現れます。これは､Trimble Survey Controller にｴｸｽﾎﾟｰﾄされるTrimble Survey Controller ｼﾞｮﾌﾞの名前です。この名前は必要に応じて編集することができます。

6.	保存をｸﾘｯｸします。｢読込み｣ﾀﾞｲｱﾛｸﾞが現れ､進行状況ﾊﾞｰが転送の進行状況を表示します。転送が完了すると､読込みﾀﾞｲｱﾛｸﾞが消えて､ﾃﾞｰﾀｺﾚｸﾀｰへの接続は切断されます。

ｱﾝﾃﾅ.iniﾌｧｲﾙ（\ﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\共通ﾌｧｲﾙ\Trimble\設定ﾌｫﾙﾀﾞ内）がTrimble Survey Controller に転送されます。

転送が完了すると､読込みﾀﾞｲｱﾛｸﾞが消えて､装置への接続は切断されます。


属性ﾉｰﾄのｴｸｽﾎﾟｰﾄ

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	CAD /ASCII ﾀﾌﾞで､｢DCﾌｧｲﾙ属性ﾉｰﾄ(Survey Controller V4)｣ｵﾌﾟｼｮﾝを選択して､OKをｸﾘｯｸします。｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	ﾌｧｲﾙ名を入力します。

4.	保存をｸﾘｯｸします。


Trimble Geomatics Office に関する情報の表示

1.	ﾍﾙﾌﾟﾒﾆｭｰから､｢Trimble Geomatics Office に関して｣ｺﾏﾝﾄﾞを選択します。｢Trimble Geomatics Officeに関して｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	OKをｸﾘｯｸします。


観測の方向の反転

1.	測量表示から､反対方向を適用したい観測を選択します。

2.	編集/観測の方向を反転を選択します。

3.	観測の方向は反転されます。反対方向が観測に適用されると､計算された座標とﾎﾟｲﾝﾄの質が変更することがあります。

警告:観測方向の始点となって欲しいﾎﾟｲﾝﾄが既知のﾎﾟｲﾝﾄ（RTK観測ﾎﾟｲﾝﾄなど）を持たない場合には､観測は適用されません。

ﾉｰﾄ:ﾄｰﾀﾙｽﾃｰｼｮﾝを使用して収集された地上観測は反転することができません。


ｴﾗｰと警告の表示

1.	以下の1つを行います。

測量表示から､警告ｲﾝｼﾞｹｰﾀﾌﾗｸﾞを持つﾎﾟｲﾝﾄか観測をﾀﾞﾌﾞﾙｸﾘｯｸします。

警告ｲﾝｼﾞｹｰﾀﾌﾗｸﾞを持つﾎﾟｲﾝﾄと観測のすべてを選択するために､ｽﾃｰﾀｽﾊﾞｰ上のﾌﾗｸﾞｱｲｺﾝをﾀﾞﾌﾞﾙｸﾘｯｸします。

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳが選択されたｴﾝﾃｨﾃｨと一緒に現れます。

2.	ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳから､表示したいﾎﾟｲﾝﾄか観測を選択します。（選択内に1つ以上のｴﾝﾃｨﾃｨを持つ場合）

3.	警告ﾍﾟｰｼﾞを表示するために､警告ﾒﾆｭｰﾎﾞﾀﾝ [image] をｸﾘｯｸします。

ﾒｯｾｰｼﾞが､発生したｴﾗｰのﾀｲﾌﾟを表示します。

4.	ﾎﾟｲﾝﾄに対する追加の詳細を表示するには､ﾎﾟｲﾝﾄ関連ﾚﾎﾟｰﾄﾂｰﾙ [image] を選択します。

ﾎﾟｲﾝﾄ関連ﾚﾎﾟｰﾄが現れます。


UKｸﾞﾘｯﾄﾞ(*.pgf)ﾌｧｲﾙをTrimble Survey Controller に転送

ﾉｰﾄ:Trimble Survey Controller  ﾊﾞｰｼﾞｮﾝ7.50以降にのみ.pgfﾌｧｲﾙを転送することができます。

1.	Trimbleﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨをｽﾀｰﾄします。以下の1つを行います。

どのﾌﾟﾛｼﾞｪｸﾄも開いていない時に､ﾕｰﾃｨﾘﾃｨ/ﾃﾞｰﾀ転送を選択します。

いつでもｽﾀｰﾄ/ﾌﾟﾛｸﾞﾗﾑ/Trimble /Trimbleﾕｰﾃｨﾘﾃｨ/ﾃﾞｰﾀ転送を選択します。

｢ﾃﾞｰﾀ転送｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢送る｣ﾀﾌﾞを選択します。

3.	装置一覧から､ﾌｧｲﾙをｴｸｽﾎﾟｰﾄしたいSurvey Controller装置を選択します。Trimbleﾃﾞｰﾀ転送ﾕｰﾃｨﾘﾃｨは選択された装置との接続を試みます。接続に成功すると､右上のｹｰﾌﾞﾙｱｲｺﾝは装置が接続されたことを示すために変化します。右上のｱｲｺﾝの下のｽﾃｰﾀｽ欄には｢<装置>に接続中｣と示されます。ここで<装置>とは､装置のﾀｲﾌﾟを意味します。（Survey Controllerなど）

4.	追加をｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。ﾙｯｸｲﾝ一覧は､この装置に対してﾌｧｲﾙを選択した最後のﾌｫﾙﾀﾞを示します。ﾒｲﾝ一覧はﾌｫﾙﾀﾞとそのﾌｫﾙﾀﾞ内のﾌｧｲﾙを示します。

5.	ﾀｲﾌﾟ別ﾌｧｲﾙ一覧から､UKｸﾞﾘｯﾄﾞﾌｧｲﾙ(*.PGF)ｵﾌﾟｼｮﾝを選択します。

6.	ﾙｯｸｲﾝ一覧と一覧ﾎﾞｯｸｽを使用して､選択されたﾄﾞﾗｲﾌﾞとﾌｫﾙﾀﾞを変更し､転送したいﾌｧｲﾙを選択します。

Trimble Geomatics Office によって提供された現存する.pgfﾌｧｲﾙを転送するには､ﾌﾟﾛｸﾞﾗﾑﾌｧｲﾙ\共通ﾌｧｲﾙ\Trimble\Geodataﾌｫﾙﾀﾞから北.pgfか東.pgfを選択します。

7.	ﾒｲﾝﾒﾓﾘかPCｶｰﾄﾞ（ｲﾝｽﾄｰﾙされている場合）にﾌｧｲﾙを送ることができます。転送先一覧から転送先を選択します。

8.	ﾌｧｲﾙﾌｫｰﾏｯﾄﾌｨｰﾙﾄﾞがｼﾞｮﾌﾞﾌｧｲﾙv7.50に設定されていることを確認します。必要に応じて､一覧からこのｵﾌﾟｼｮﾝを選択します。

9.	選択をｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが終了し､ﾃﾞｰﾀ転送ﾀﾞｲｱﾛｸﾞに戻ります。選択したﾌｧｲﾙは｢転送されるﾌｧｲﾙ｣一覧に現れます。

10.	転送をｸﾘｯｸします。装置のﾌｧｲﾙﾌｫｰﾏｯﾄからﾌｧｲﾙが変換されている間､｢変換中｣ﾀﾞｲｱﾛｸﾞが現れます。すべてのﾌｧｲﾙが変換されると､選択されたﾌｧｲﾙのｴｸｽﾎﾟｰﾄの進行状況を示しながら､｢転送中｣が現れます。

転送が完了すると｢転送完了｣ﾀﾞｲｱﾛｸﾞが転送の結果を伴って現れます。

ﾉｰﾄ:Trimble Survey Controller ﾊﾞｰｼﾞｮﾝ7.60 から/へﾃﾞｰﾀを転送する場合には､ﾊﾞｰｼﾞｮﾝ7.50.dcﾌｧｲﾙﾌｫｰﾏｯﾄを使用します。


保存された平均座標と調整座標（網平均ﾓｼﾞｭｰﾙから派生）を使用してのｷｬﾘﾌﾞﾚｰｼｮﾝ

1.	最小固定された調整が完了し､網平均の各ﾎﾟｲﾝﾄにWGS-84座標を確立した後に､ｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝに対する観測されたGPS座標として使用するためにその座標を保存します。平均座標は､WGS-84緯度､経度､楕円体高から構成されます。

平均座標を保存するには､

調整/平均座標/保存を選択します。

｢平均座標の保存｣ﾀﾞｲｱﾛｸﾞが現れます。

ﾉｰﾄ:このｺﾏﾝﾄﾞは､WGS-84が調整測地系として選択され､過去の調整にGPS観測のみが含まれた時にのみ利用可能です。

ﾉｰﾄ:調整変換ﾊﾟﾗﾒｰﾀが調整中に作成された場合には､それはGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを実行する時に放棄されます。Trimble Geomatics Office は1つしか受け入れないからです。

2.	以下の1つを選択します。

｢現存するﾎﾟｲﾝﾄ下に座標を作成｣ｵﾌﾟｼｮﾝ

｢接頭辞の付く新しいﾎﾟｲﾝﾄ下に座標を作成｣ｵﾌﾟｼｮﾝ

3.	OKをｸﾘｯｸします。平均座標が保存されました。

ﾉｰﾄ:1つのWGS-84座標が調整内の各ﾎﾟｲﾝﾄに対して作成されます。ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳでこの座標を見ることができます。この座標を編集することはできません。

4.	ﾌﾟﾛｼﾞｪｸﾄ測地系で拘束された調整を行います。（これを行う方法に関しては該当する網平均ﾍﾙﾌﾟ項目を参照）調整された値はﾃﾞｰﾀﾍﾞｰｽに保存されます。

ﾉｰﾄ:1つの調整されたｸﾞﾘｯﾄﾞ座標が調整内のそれぞれの無拘束のﾎﾟｲﾝﾄに対して作成されます。この座標はﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳで見ることができます。

5.	ﾎﾟｲﾝﾄﾍﾟｱを引き出す網平均を使用してGPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを行います。これを行うには､測量/GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝを選択します。｢GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

6.	｢ｷｬﾘﾌﾞﾚｰｼｮﾝ要素｣ｸﾞﾙｰﾌﾟで､計算したいｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀを選択します。

7.	ﾎﾟｲﾝﾄ一覧をｸﾘｯｸします。｢ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞが現れます。

8.	｢ﾎﾟｲﾝﾄ一覧｣ﾀﾞｲｱﾛｸﾞを使用して､ｷｬﾘﾌﾞﾚｰｼｮﾝのためのﾎﾟｲﾝﾄﾍﾟｱ（GPSﾎﾟｲﾝﾄとｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄ）を選択します。以下の1つを行います。

ﾌｨｰﾙﾄﾞ記入を使用するか､GPSﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞに保存された平均座標の名前を入力します。

ﾌｨｰﾙﾄﾞ記入を使用するか､ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞで一致する調整座標の名前を入力します。

最小固定された座標が同じﾎﾟｲﾝﾄ下に保存された場合には､ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄﾌｨｰﾙﾄﾞは自動的に記入されます。GPSﾎﾟｲﾝﾄが入力される時､表示される値は保存された平均座標からのものです。ｸﾞﾘｯﾄﾞﾎﾟｲﾝﾄが入力される時､調整された値が選択されます。

9.	ｷｬﾘﾌﾞﾚｰｼｮﾝに必要なﾎﾟｲﾝﾄﾍﾟｱのすべてを選択するまで､上記のｽﾃｯﾌﾟを繰り返します。

10.	すべてのﾎﾟｲﾝﾄﾍﾟｱを選択したら､｢GPSｻｲﾄｷｬﾘﾌﾞﾚｰｼｮﾝ｣ﾀﾞｲｱﾛｸﾞに戻るために閉じるをｸﾘｯｸします。

11.	算出をｸﾘｯｸして､ｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀを計算します。ｷｬﾘﾌﾞﾚｰｼｮﾝの結果がｷｬﾘﾌﾞﾚｰｼｮﾝ要旨ｸﾞﾙｰﾌﾟに表示されます。

12.	OKをｸﾘｯｸして､ﾌﾟﾛｼﾞｪｸﾄにｷｬﾘﾌﾞﾚｰｼｮﾝを適用します。座標系はｷｬﾘﾌﾞﾚｰｼｮﾝﾊﾟﾗﾒｰﾀと一緒に更新されます。ここでTrimble Survey Controller にｷｬﾘﾌﾞﾚｰｼｮﾝを転送することができます。


ｲﾍﾞﾝﾄのﾚﾎﾟｰﾄとｴｸｽﾎﾟｰﾄ

ﾚｼｰﾊﾞｰによって記録されたｲﾍﾞﾝﾄの時間を記録するためのﾚﾎﾟｰﾄとｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄを定義することができます。

ｲﾍﾞﾝﾄをﾚﾎﾟｰﾄするには､ｶｽﾀﾑﾃﾞｰﾀﾍﾞｰｽﾚﾎﾟｰﾄを作成します。

1.Trimble Geomatics Office でｲﾍﾞﾝﾄ記録を持つﾎﾟｲﾝﾄを選択します。これを行うには､

a.	選択/ﾎﾟｲﾝﾄを選択します。｢ﾎﾟｲﾝﾄの選択｣ﾀﾞｲｱﾛｸﾞが現れます。

b.	GPSﾀﾌﾞを選択します。

c.	ﾌｨｰﾙﾄﾞ方法一覧から､ｲﾍﾞﾝﾄを選択します。

d.	OKをｸﾘｯｸします。ｲﾍﾞﾝﾄﾚｺｰﾄﾞを持つすべてのﾎﾟｲﾝﾄが選択されます。

2.	ﾚﾎﾟｰﾄ/ﾚﾎﾟｰﾄの追加を選択します。｢ﾚﾎﾟｰﾄの追加｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	以下の1つを行います。

編集をｸﾘｯｸして､現存するﾚﾎﾟｰﾄﾌｫｰﾏｯﾄを修正します。

新規をｸﾘｯｸして新しいﾚﾎﾟｰﾄﾌｫｰﾏｯﾄを作成します。.

｢ﾚﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	｢本文ﾌｫｰﾏｯﾄ｣ﾌｨｰﾙﾄﾞで､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽするために右ｸﾘｯｸしてから､高度/ｻﾌﾞﾚｺｰﾄﾞ/ﾎﾟｲﾝﾄ観測/時間を選択します。

ｶｽﾀﾑｴｸｽﾎﾟｰﾄ定義のためにｲﾍﾞﾝﾄをｴｸｽﾎﾟｰﾄするには､

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	ｶｽﾀﾑﾀﾌﾞで､以下の1つを行います。

ﾌｫｰﾏｯﾄの編集をｸﾘｯｸして､現存するﾌｫｰﾏｯﾄを修正します。

新しいﾌｫｰﾏｯﾄをｸﾘｯｸして､新しいﾚﾎﾟｰﾄﾌｫｰﾏｯﾄを作成します。

｢ASCIIｴｸｽﾎﾟｰﾄﾌｫｰﾏｯﾄの定義｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	｢本文ﾌｫｰﾏｯﾄ｣ﾌｨｰﾙﾄﾞで､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽするために右ｸﾘｯｸしてから､高度/ｻﾌﾞﾚｺｰﾄﾞ/ﾎﾟｲﾝﾄ観測/時間を選択します。


時間ﾌｫｰﾏｯﾄﾚｲｱｳﾄ

ｲﾍﾞﾝﾄに対する典型的な時間表示ﾌｫｰﾏｯﾄは次の様式です。09:12:55 8 Feb 2000

このﾚｲｱｳﾄを変更するためには､ｼｮｰﾄｶｯﾄﾒﾆｭｰにｱｸｾｽするためにﾌｨｰﾙﾄﾞｺｰﾄﾞの隣を右ｸﾘｯｸしﾃｷｽﾄから､高度/続き/ﾌｫｰﾏｯﾄﾚｲｱｳﾄを選択します。ｻﾝﾌﾟﾙの時間ﾌｫｰﾏｯﾄﾚｲｱｳﾄを選択するか､自分の好む様式を作成します。詳細に関しては､時間ﾌｫｰﾏｯﾄﾚｲｱｳﾄの項目を参照してください。

ﾉｰﾄ:ｲﾍﾞﾝﾄ時間を一番近いﾐﾘ秒で表示するには､ﾌｨｰﾙﾄﾞｺｰﾄﾞに以下の時間ﾌｫｰﾏｯﾄﾚｲｱｳﾄを追加します。<H:mm:ss.nnn>　ここではnnnが小数点以下の秒の桁数になります。例､[ﾎﾟｲﾝﾄ観測時間:<H:mm:ss.nnn>]　時間の精度を高めるためには､小数点以下の秒の桁数を増加させます。例えば､nnnnは最初の4桁の小数点以下の秒数を出力します。


ﾌﾟﾛｼﾞｪｸﾄ間で観測ﾃﾞｰﾀのｺﾋﾟｰ

Trimble Geomatics Office ﾌﾟﾛｼﾞｪｸﾄ間で観測ﾃﾞｰﾀをｺﾋﾟｰするには､Trimbleﾃﾞｰﾀ交換ﾌｫｰﾏｯﾄを使用します。ｺﾋﾟｰ･貼り付けを使用することはできません。

ｿﾌﾄｳｪｱﾌﾟﾛｼﾞｪｸﾄ間で観測ﾃﾞｰﾀをｺﾋﾟｰするには､

1.	現在のTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄで､ｺﾋﾟｰしたい観測ﾃﾞｰﾀを選択します。

2.	Trimbleﾃﾞｰﾀ交換ﾌｫｰﾏｯﾄを使用して現在のﾌﾟﾛｼﾞｪｸﾄからﾃﾞｰﾀをｴｸｽﾎﾟｰﾄします。

a.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。｢ｴｸｽﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

b.	測量ﾀﾌﾞで､Trimbleﾃﾞｰﾀ交換ﾌｫｰﾏｯﾄを選択して､OKをｸﾘｯｸします。｢名前を付けて保存｣ﾀﾞｲｱﾛｸﾞが現れます。

c.	ﾌｧｲﾙを保存します。

3.	Trimble Geomatics Office で新しいﾌﾟﾛｼﾞｪｸﾄを作成します。

4.	Trimbleﾃﾞｰﾀ交換ﾌｫｰﾏｯﾄを使用して新しいﾌﾟﾛｼﾞｪｸﾄに観測ﾃﾞｰﾀをｲﾝﾎﾟｰﾄします

a.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

b.	測量ﾀﾌﾞで､Trimbleﾃﾞｰﾀ交換ﾌｫｰﾏｯﾄを選択して､OKをｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

c.	ﾌｧｲﾙを選択します。

観測ﾃﾞｰﾀがTrimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄにｲﾝﾎﾟｰﾄされます。

ﾉｰﾄ:ﾌﾟﾛｼﾞｪｸﾄ内の観測とﾎﾟｲﾝﾄすべてのｺﾋﾟｰを作成したい場合には､Trimble Geomatics Office ﾌﾟﾛｼﾞｪｸﾄのｺﾋﾟｰを作成します。


地上ﾃﾞｰﾀを自分でｲﾝﾎﾟｰﾄ

Trimble Geomatics Office に地上ﾃﾞｰﾀを自分でｲﾝﾎﾟｰﾄするには､Softdesk Fieldbook ﾌｫｰﾏｯﾄを使用します。このﾌｫｰﾏｯﾄはAutodeskによって開発されました。

地上ﾃﾞｰﾀを使用して､Softdesk Fieldbookﾌｫｰﾏｯﾄでﾌｧｲﾙを作成します。

Trimble Geomatics Office にﾌｧｲﾙをｲﾝﾎﾟｰﾄします。

a.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

b.	測量ﾀﾌﾞで､ｻｰﾄﾞﾊﾟｰﾃｨｰﾃﾞｰﾀﾚｺｰﾀﾞｰﾌｧｲﾙを選択します。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

c.	ｲﾝﾎﾟｰﾄしたいﾌｧｲﾙを選択します。

d.	｢ﾀｲﾌﾟ別ﾌｧｲﾙ｣ﾌｨｰﾙﾄﾞで､Autodesk FBK fieldbookﾌｫｰﾏｯﾄﾌｧｲﾙ(*.FBK)を選択して､OKをｸﾘｯｸします。

ﾌｧｲﾙは､Trimble Geomatics Officeﾌﾟﾛｼﾞｪｸﾄにｲﾝﾎﾟｰﾄされます。

ﾉｰﾄ:Autodesk Softdesk Fieldbookに関しては以下に説明されています。このﾌｫｰﾏｯﾄは､AutoCAD Land Development Desktopのﾍﾙﾌﾟﾌｧｲﾙから取られました。

以下を考慮します。

認識されるｺﾏﾝﾄﾞで始まらないﾌｫｰﾏｯﾄの行は無視されます。

括弧(　)で囲まれた項目の記入は必須ではありません。

Trimble Geomatics Office はﾎﾟｲﾝﾄ番号を使用することを要求します。

ﾎﾟｲﾝﾄ説明(説明)は､Fieldbookﾌｫｰﾏｯﾄﾌｧｲﾙ定義の一部なので､引用符(")内に含まれなければなりません。これは､ｽﾍﾟｰｽもﾎﾟｲﾝﾄ説明に使用されることができることを意味します。


ﾎﾟｲﾝﾄ作成ｺﾏﾝﾄﾞ

AD (ﾎﾟｲﾝﾄ) [角度] [距離] (説明)

AD [VA] (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直角度] (説明)

AD [VD] (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直距離] (説明)

BD (ﾎﾟｲﾝﾄ) [方向] [4象限] [距離] (説明)

BD [VA] (ﾎﾟｲﾝﾄ) [方向] [4象限] [距離] [垂直角度] (説明)

BD [VA] (ﾎﾟｲﾝﾄ) [方向] [4象限] [距離] [垂直距離] (説明)

DD (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直角度] (説明)

DD [VA] (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直角度] (説明)

DD [VD] (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直距離] (説明)

F1/F2 (ﾎﾟｲﾝﾄ) [角度] [距離] (説明)

F1/F2 [VA] (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直角度] (説明)

F1/F2 [VD] (ﾎﾟｲﾝﾄ) [角度] [距離] [垂直距離] (説明)

NE (ﾎﾟｲﾝﾄ) [北] [東] (説明)

NEZ (ﾎﾟｲﾝﾄ) [北] [東] (標高) (説明)

NE SS (ﾎﾟｲﾝﾄ) [北] [東] (標高) (説明)

ﾌﾟﾘｽﾞﾑ [高度]

PT ｵﾌｾｯﾄ (ﾎﾟｲﾝﾄ) [ｵﾌｾｯﾄ] (先)

STADIA (ﾎﾟｲﾝﾄ) [角度] [距離] [水準測量棒] (垂直角度) (説明)

ZD (ﾎﾟｲﾝﾄ) [方位角] [距離] (説明)

ZD [VA] (ﾎﾟｲﾝﾄ) [方位角] [距離] [垂直角度] (説明)

ZD [VD] (ﾎﾟｲﾝﾄ) [方位角] [距離] [垂直距離] (説明)


ﾎﾟｲﾝﾄの位置ｺﾏﾝﾄﾞ

AZ [ﾎﾟｲﾝﾄ 1] [ﾎﾟｲﾝﾄ 2] [方位角]

BS [ﾎﾟｲﾝﾄ] (方位ｵﾌｾｯﾄ)

STN [ﾎﾟｲﾝﾄ] (機械高) (説明)


機械補正ｺﾏﾝﾄﾞ

角度 [右･左] [天頂､天低､水平面]

ATMOS [ｵﾝ･ｵﾌ]

CR [ｵﾝ･ｵﾌ]

EDMｵﾌｾｯﾄ  [ｵﾌｾｯﾄ]

水平角度 [右･左]

圧力 [圧力] [ｲﾝﾁ､MBAR､MM]

SF [率]

ﾌﾟﾘｽﾞﾑ定数  [定数]

ﾌﾟﾘｽﾞﾑ ｵﾌｾｯﾄ  [ｵﾌｾｯﾄ]

温度 [温度] [F､C､K]

単位 [ﾒｰﾄﾙ､ﾌｨｰﾄ] [DMS､DECDEG､GRAD､MILS､RADIANS]

垂直角度 [天頂､天低､水平面]


ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳで座標を追加

Trimble Geomatics Office で､要旨ﾍﾟｰｼﾞの｢座標を追加｣ﾂｰﾙ [image] を使用することで､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳでﾎﾟｲﾝﾄに対する座標を追加することができます。

これを行うには､

1.	ﾌﾟﾛｼﾞｪｸﾄ内のﾎﾟｲﾝﾄをﾀﾞﾌﾞﾙｸﾘｯｸします。ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳが現れます。

2.	要旨ﾍﾟｰｼﾞで､ [image] を選択してから､追加する必要のある座標のﾀｲﾌﾟ（ｸﾞﾘｯﾄﾞやﾛｰｶﾙ､WGS 84）を選択します

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳの系統図で､選択したﾎﾟｲﾝﾄ下に新しい座標が現れます。座標がｸﾞﾘｯﾄﾞ（G）､ﾛｰｶﾙ（L）､WGS-84(W)座標のどれであるかを意味する接頭辞を名前に追加します。新しい座標に対する要旨ﾍﾟｰｼﾞはすべてのﾌｨｰﾙﾄﾞがﾇﾙであると示します。

ﾉｰﾄ:各ﾎﾟｲﾝﾄに対して､1つのWGS-84座標と1つのｸﾞﾘｯﾄﾞかﾛｰｶﾙ座標しか入力できません。WGS-84座標を追加する時には､｢座標を追加｣一覧でこのｵﾌﾟｼｮﾝは利用できなくなります。ﾎﾟｲﾝﾄが既にWGS-84座標とｸﾞﾘｯﾄﾞかﾛｰｶﾙ座標を持つ場合には､｢座標を追加｣ﾎﾞﾀﾝは利用できません。

3.	座標に対する北距､東距､標高､高度ﾌｨｰﾙﾄﾞを記入するには､それぞれのﾌｨｰﾙﾄﾞをｸﾘｯｸしてから､｢現在値の挿入｣ﾎﾞﾀﾝ [image] をｸﾘｯｸします。それぞれのﾌｨｰﾙﾄﾞに現在のﾎﾟｲﾝﾄﾎﾟｼﾞｼｮﾝと質が記入されます。必要に応じてこの情報を編集することができます。

ﾋﾝﾄ:観測の代わりにこの座標を使用することに確信がある時にのみ座標を追加します。同じ質であれば観測に優先して入力された座標が再算出に使用されます。これは､設計ﾎﾟｲﾝﾄが杭打ち観測に優先して使用されることを確実にします。

ﾉｰﾄ:追加座標は､Trimble Geomatics Office によって生成され､ﾎﾟｲﾝﾄに対して保管されることができます。こういった座標には以下のものが含まれます。

調整から派生した座標

ｷｬﾘﾌﾞﾚｰｼｮﾝに対して保存されたWGS-84座標


ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ内の座標の編集

概要と詳細

Trimble Geomatics Office で､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ内ﾎﾟｲﾝﾄに対する座標を編集できます。

これを行うには､

1.	ﾌﾟﾛｼﾞｪｸﾄ内のﾎﾟｲﾝﾄをﾀﾞﾌﾞﾙｸﾘｯｸします。ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳが現れます。

2.	ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳの系統図で､ﾎﾟｲﾝﾄに対する系統図を拡張し､編集したいｷｰﾎﾞｰﾄﾞで入力される座標（WGS-84か､ｸﾞﾘｯﾄﾞ/ﾛｰｶﾙ）を選択します。

3.	座標成分と座標の質を編集します。

ﾉｰﾄ: 座標ﾌｨｰﾙﾄﾞを編集可能とするためには､座標表示設定と座標ﾀｲﾌﾟ設定が同じでなければなりません。

4.	座標を編集してから､再計算を行うために測量/再計算を選択します。

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ内での座標の追加や編集に関する詳細は､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳ－座標の項を参照してください。


ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙのｲﾝﾎﾟｰﾄ

ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙ(*.dat,*.raw)ﾌｧｲﾙをｲﾝﾎﾟｰﾄしたり､DiNiﾃﾞｼﾞﾀﾙﾚﾍﾞﾙを使用して（測量装置の使用）ﾌｧｲﾙをﾀﾞｲｱﾛｸﾞしたりすると､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。これを行うには､

1.	ﾌｧｲﾙ\ｲﾝﾎﾟｰﾄを選択します。｢ｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	測量ﾀﾌﾞで､ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙ(*.dat,*.raw)を選択して､OKをｸﾘｯｸします。｢開く｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙを選択します。｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞが現れます。

4.	｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞで､ｽﾃｰｼｮﾝﾎﾟｲﾝﾄ列でﾁｪｯｸﾎﾞｯｸｽをｵﾝにすることによってｽﾃｰｼｮﾝﾎﾟｲﾝﾄを定義します。

ﾃﾞﾙﾀ標高は､ｽﾃｰｼｮﾝﾎﾟｲﾝﾄ間で算出されます。ｽﾃｰｼｮﾝﾎﾟｲﾝﾄがｲﾝﾎﾟｰﾄされる時､それは同じ名前を持つ他のﾎﾟｲﾝﾄと結合されます。ﾎﾟｲﾝﾄ名が独特であることを確認してください。｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞでﾎﾟｲﾝﾄ名を編集することができます。

ﾉｰﾄ:ｽﾃｰｼｮﾝﾎﾟｲﾝﾄと定義されていないﾎﾟｲﾝﾄはｲﾝﾎﾟｰﾄされません。

5.	｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞで､始点に対する標高を入力します。この標高は､他のﾎﾟｲﾝﾄに対する標高を算出するのに使用されます。始点標高を編集するには､環の中のﾎﾟｲﾝﾄをｸﾘｯｸします。環に対する始点標高は標高ｸﾞﾙｰﾌﾟに示されます。標高ｸﾞﾙｰﾌﾟでは､標高と質を編集してからEnterをｸﾘｯｸします。標高はすべてのｽﾃｰｼｮﾝﾎﾟｲﾝﾄに対して算出されます。こういった算出された標高を使用して､既知の値とﾁｪｯｸし､ﾃﾞｰﾀを有効にします。

ﾉｰﾄ:標高記号を持つ標高だけが､ｲﾝﾎﾟｰﾄされた標高です。その他のすべてのｽﾃｰｼｮﾝﾎﾟｲﾝﾄはｲﾝﾎﾟｰﾄされたﾃﾞﾙﾀ標高を持ちます。その標高は､再算出が行われる時に算出されます。

ﾋﾝﾄ:｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞで行う変更のすべては､ｲﾝﾎﾟｰﾄされたﾃﾞｰﾀのみに影響を与えます。その変更が､ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙ(*.dat,*.raw)ﾌｧｲﾙに影響を与えることはありません。

6.	OKをｸﾘｯｸします。ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾌｧｲﾙがｲﾝﾎﾟｰﾄされました。

ﾉｰﾄ:ｲﾝﾎﾟｰﾄされた観測は水平座標を持たないかもしれないので､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに表示されないかもしれません。ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳでﾚﾍﾞﾙﾃﾞｰﾀを表示するには､選択ﾂｰﾙの1つを使用してﾚﾍﾞﾙ観測を選択してから､ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳを開きます。これを行うには､以下の1つを行います。

編集/ﾌﾟﾛﾊﾟﾃｨを選択します。

ﾂｰﾙﾊﾞｰでﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳﾂｰﾙ [image] を選択します。

ﾋﾝﾄ:ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙﾃﾞｰﾀを収集する時､独特の接頭辞か接尾辞と一緒に､Trimble Geomatics Office にｲﾝﾎﾟｰﾄしたいﾎﾟｲﾝﾄを保存することをﾄﾘﾝﾌﾞﾙ社はお勧めします。例えば､使用したいﾎﾟｲﾝﾄすべてを接頭辞STNを持つｽﾃｰｼｮﾝﾎﾟｲﾝﾄとして保存します。これによって､｢ﾃﾞｼﾞﾀﾙﾚﾍﾞﾙｲﾝﾎﾟｰﾄ｣ﾀﾞｲｱﾛｸﾞでﾌｨﾙﾀｰで選択ﾎﾞﾀﾝを使用してﾎﾟｲﾝﾄを選択するのが簡単になります。


Trimble Geomatics Office で背景地図を表示

概要と詳細

Trimble Geomatics Office で背景地図を表示するには､

1.	表示 / ｵﾌﾟｼｮﾝ を選択します。｢表示ｵﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢背景地図｣ﾀﾌﾞで追加をｸﾘｯｸします。｢追加｣ﾀﾞｲｱﾛｸﾞが現れます。

3.	背景地図ﾌｧｲﾙを選択して､OKをｸﾘｯｸします。.

ﾉｰﾄ:Trimble Geomatics Office は､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳに背景ﾌｧｲﾙを表示することができます。Drawing Exchangeﾌｫｰﾏｯﾄ(.dxf)､Windows Bitmap (ｳｨﾝﾄﾞｳｽﾞﾋﾞｯﾄﾏｯﾌﾟ､.bmp)またはTagged Image Fileﾌｫｰﾏｯﾄ(標識ｲﾒｰｼﾞﾌｧｲﾙ､.tif)ﾌｧｲﾙをｲﾝﾎﾟｰﾄして表示することができます。ｳｨﾝﾄﾞｳｽﾞﾋﾞｯﾄﾏｯﾌﾟ(.bmp)と標識ｲﾒｰｼﾞﾌｧｲﾙﾌｫｰﾏｯﾄ(.tif)ﾌｧｲﾙは正しく表示されるためには地球に参照されなければなりません。ESRIのWorldﾌｧｲﾙﾌｫｰﾏｯﾄが､背景ﾌｧｲﾙを地球に参照するために使用されます。こういったﾌｧｲﾙは､対応する背景ﾌｧｲﾙと同じﾌｫﾙﾀﾞの中になければなりません。

Trimble Geomatics Office に背景地図ﾌｧｲﾙが現れます。

Trimble Geomatics Office での背景地図の使用に関する詳細は､ｵﾌﾟｼｮﾝの表示－背景地図の項を参照してください。


Trimble Geomatics Office でｸﾞﾘｯﾄﾞﾗｲﾝを表示

1.	表示/ｵﾌﾟｼｮﾝを選択します。｢表示ｵﾌﾟｼｮﾝ｣ﾀﾞｲｱﾛｸﾞが現れます。

2.	｢ｸﾞﾘｯﾄﾞﾗｲﾝ｣ﾀﾌﾞで､｢ｸﾞﾘｯﾄﾞﾗｲﾝを表示｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。このｸﾞﾙｰﾌﾟのｵﾌﾟｼｮﾝが利用できるようになります。

3.	｢ｸﾞﾘｯﾄﾞﾗｲﾝの固定数｣か｢ｸﾞﾘｯﾄﾞ間隔｣ｵﾌﾟｼｮﾝを選択して､それぞれのﾌｨｰﾙﾄﾞでおおよその値を入力します。

4.	ｸﾞﾘｯﾄﾞﾗｲﾝﾀｲﾌﾟと色を選択します。

5.	ｸﾞﾘｯﾄﾞﾗｲﾝにﾗﾍﾞﾙを付けたい場合には､｢ｸﾞﾘｯﾄﾞﾗｲﾝにﾗﾍﾞﾙ付け｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

6.	OKをｸﾘｯｸします。.


独立基線の選択

独立基線のｾｯﾄは､与えられたGPSﾌｨｰﾙﾄﾞｾｯｼｮﾝで､すべてのﾎﾟｲﾝﾄ占有を接続するのに必要な最小数の基線から構成されています。同時GPSﾎﾟｲﾝﾄ占有｢n｣のどのｾｯﾄを取っても､n � 1 独立基線があります。例えば､5つのﾚｼｰﾊﾞｰを持つﾌｨｰﾙﾄﾞｾｯｼｮﾝには､10の基線の可能性がありますが､4つの独立基線しかありません。以下の図では､独立基線は点線によって象徴されます。

独立基線ｾｯﾄの概念は､静止と高速静止技術を使用して行われる測量に主に適用され､網平均を含んでいるﾌﾟﾛｼﾞｪｸﾄに対しては特に重要です。

独立基線ｾｯﾄの使用は､網平均が冗長（自由の膨張度）の人為的感覚によって影響を受けないことを確実にします。それは､調整された座標でｴﾗｰの過小評価に結びつくことがあります。

2つ以上のﾚｼｰﾊﾞｰを使用してGPSﾌｨｰﾙﾄﾞｾｯｼｮﾝから派生した基線は､複数の独立基線ｾｯﾄに形成されることがあります。独立ｾｯﾄに含まれる基線の選択は､基線解の質か､期待する網幾何学を達成することを基礎とすることができます。

独立基線ｾｯﾄを特定するには､以下の1つを行います。

GPSﾌｨｰﾙﾄﾞｾｯｼｮﾝに対して潜在する基線すべての中から基線の独立ｾｯﾄだけを選択し処理します。

GPSﾌｨｰﾙﾄﾞｾｯｼｮﾝに対して潜在する基線すべてを処理し､結果がﾌﾟﾛｼﾞｪｸﾄに保存される時点で独立ｾｯﾄを選択します。

GPSﾌｨｰﾙﾄﾞｾｯｼｮﾝに対して潜在する基線すべてを処理し､すべての結果をﾌﾟﾛｼﾞｪｸﾄに保存します。その後網平均によって依存基線を考慮から除外します。

これを行うには､｢依存基線の表示｣ﾂｰﾙ [image] を使用します。このﾂｰﾙを使用して､ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳと時系列の観測をﾘﾝｸすることができます。それを選択すると､ｿﾌﾄｳｪｱは現在の時系列表示内で後処理された基線と､それと同時に観測され､後処理された基線だけを表示します。測量表示のその他の後処理された基線すべては隠されます。

｢依存基線の表示｣ﾂｰﾙを使用して､同時に観測された基線を表示し､依存基線が調整に使用されるのを防ぎます。

これを行うには､以下の1つを行います。

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳで､依存基線のｽﾃｰﾀｽを無効に変更します。

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳで､依存基線のｽﾃｰﾀｽを｢ﾁｪｯｸとして有効｣に変更します。

ﾌﾟﾛﾊﾟﾃｨｳｨﾝﾄﾞｳで､依存基線に対する｢網平均で使用｣ﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。

観測ﾀﾞｲｱﾛｸﾞを使用して､依存基線に対する｢使用｣ﾁｪｯｸﾎﾞｯｸｽをｵﾌにします。

こういった作業を実行するのに最良の方法は､｢複数編集｣ﾀﾞｲｱﾛｸﾞです。例として､依存基線のｽﾃｰﾀｽを｢無効｣に変更するには､

1.	｢依存基線の表示｣ﾂｰﾙを選択します。

2.	ｸﾞﾗﾌｨｯｸｽｳｨﾝﾄﾞｳで依存基線を選択します。

3.	編集/複数編集を選択します。｢複数編集｣ﾀﾞｲｱﾛｸﾞが表れます。

4.	｢観測ｽﾃｰﾀｽの設定｣ﾁｪｯｸﾎﾞｯｸｽをｵﾝにします。

5.	一覧から､｢無効｣を選びOKをｸﾘｯｸします。

選択された観測はここで無効のｽﾃｰﾀｽを持つようになります。


Trimble 3600/5600 GDM ﾌｧｲﾙのｲﾝﾎﾟｰﾄ

ﾉｰﾄ:  測量ﾃﾞｰﾀがｼﾞｮﾌﾞとｴﾘｱﾌｧｲﾙの両方に含まれる場合には､ｴﾘｱﾌｧｲﾙを先にｲﾝﾎﾟｰﾄします。

1.	ﾌｧｲﾙ/ｲﾝﾎﾟｰﾄを選択します。ｲﾝﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが現れます｡

2.	測量ﾀﾌﾞで､Trimble 3600/5600 GDM ﾌｧｲﾙ(*.job,*.are)を選択してから､ｵﾌﾟｼｮﾝをｸﾘｯｸします。設定ﾀﾞｲｱﾛｸﾞが現れます。

3.	Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄに対する設定と､重複ﾎﾟｲﾝﾄ設定を特定します。

4.	すべての変更を受け入れるためにOKをｸﾘｯｸして､ｲﾝﾎﾟｰﾄﾀﾞｲｱﾛｸﾞに戻ります。

5.	OKをｸﾘｯｸします。開くﾀﾞｲｱﾛｸﾞが現れます｡

6.	ｲﾝﾎﾟｰﾄするﾌｧｲﾙを選択してから､開く をｸﾘｯｸします｡

ﾉｰﾄ:Trimble Geomatics Office は､すべての3600/5600 GDM ﾌｧｲﾙは縮尺係数のみと定義されていると仮定します。更に詳しい情報には､縮尺係数のみを参照してください。

関連項目


Trimble 3600/5600 GDM ｴﾘｱ(*.are)ﾌｧｲﾙへのｴｸｽﾎﾟｰﾄ

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。ｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが現れます｡

2.	測量ﾀﾌﾞで､Trimble 3600/5600 GDM ﾌｧｲﾙ(*.are)を選択してから､ｵﾌﾟｼｮﾝをｸﾘｯｸします。設定ﾀﾞｲｱﾛｸﾞが現れます。

3.	Trimble 3600/5600 GDM ｺﾝﾄﾛｰﾙﾕﾆｯﾄに対する設定を特定します。

4.	すべての変更を受け入れるためにOKをｸﾘｯｸして､ｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞに戻ります。

5.	OKをｸﾘｯｸします。名前を付けて保存ﾀﾞｲｱﾛｸﾞが現れます｡

6.	ﾌｧｲﾙ名と場所を指定してから､保存 をｸﾘｯｸします｡（標準ではﾌﾟﾛｼﾞｪｸﾄ名がﾌｧｲﾙ名を決定します。）

ﾉｰﾄ:ｴﾘｱﾌｧｲﾙにｴｸｽﾎﾟｰﾄされる座標は､Trimble Geomatics Office ﾌﾟﾛｼﾞｪｸﾄで定義された座標系を使用します。

関連項目


Trimble 3600/5600 機器へのPｺｰﾄﾞ(*.pco)ﾌｧｲﾙのｴｸｽﾎﾟｰﾄ

1.	ﾌｧｲﾙ/ｴｸｽﾎﾟｰﾄを選択します。ｴｸｽﾎﾟｰﾄﾀﾞｲｱﾛｸﾞが現れます｡

2.	測量ﾀﾌﾞで､PｺｰﾄﾞﾌｧｲﾙをTrimble 3600/5600 GDM ﾌｧｲﾙ(*.pco)へを選択してから､OKをｸﾘｯｸします。選択ﾀﾞｲｱﾛｸﾞが現れます。

3.	Pｺｰﾄﾞﾌｧｲﾙを選択して､開くをｸﾘｯｸします｡ﾃﾞｰﾀ転送､名前を付けて保存ﾀﾞｲｱﾛｸﾞが現れます｡

4.	Trimble 3600/5600 GDM 装置を選択して､開くをｸﾘｯｸします｡接続ﾀﾞｲｱﾛｸﾞが現れます。接続が確立されると､保存ﾀﾞｲｱﾛｸﾞが現れます｡

5.	保存をｸﾘｯｸします。ﾀﾞｲｱﾛｸﾞがﾌｧｲﾙ転送の進行状況を表示します。転送が完了すると、装置への接続は切断されます。

関連項目