Copyright: (C) 1999-2002 Trimble Navigation Limited
Citation: (C) 1999-2002 Trimble Navigation Limited


    망 조정 - 목차

나오는 항목:

  망 조정

  조정 데이텀

  망 조정 스타일

  포인트

  관측치

  관측치 그룹

  가중 전략

  조정

  캘리브레이션 좌표

  조정 제거

  망 조정 보고서

도움말을 보는 방법은 F1 키를 누르면 자세히 알 수 있습니다.

필요한 정보가 이 도움말에 없을 경우에는 'Trimble Geomatics Office − Network Adjustment User Guide'를 참조하거나 Trimble 판매처에 문의하십시오. 또는 기술 지원을 참조하시기 바랍니다.

© 1999−2002, Trimble Navigation Limited. All rights reserved.


    망 조정 - 개요

추가 정보

 기타

개요

망의 최소 자승 조정을 수행하는 목적:

  우연 오차의 추정 및 제거

  여유(redundant) 데이터가 있을 때 단일 해를 도출

  관측치에 적용하는 보정치를 최소화

  과오 및 큰 오차를 탐지

  추정 정밀도 등 분석용 정보를 산출

최소 자승 조정을 성공적으로 완료한 후, 다음 사항을 결정하게 됩니다.

  관측치와 기준점에 과오나 정오차가 없음

  잔여 오차의 크기가 작고 우연적이며 적절히 분포되어 있음

최소 자승 조정을 거치면 위치적 폐합과 추정 반복성(Estimates of repeatability)이 좋아지므로 측정치(현재와 미래)의 신뢰성을 확보할 수 있습니다.

성공적인 조정을 이루기 위한 최소 자승 망의 기준:

  기하학적으로나 수학적으로 반드시 폐합된 망이어야 함

  잔차의 가중 제곱 합이 반드시 최소화되어야 함

망의 기하학적 폐합이란 양호한 폐합 기하 구조를 이용한 망의 설계를 의미합니다. GPS 망이나 비GPS 망은 망 포인트들을 잇는 일련의 관측치로 구성되는데 이 관측치들은 삼각형과 같은 기하학적 폐합체 모양을 형성합니다.

망의 수학적 폐합이란 큰 오차나 과오를 관측치로부터 모두 제거함으로써 바람직한 통계적 결과를 확보하는 것을 말합니다.

가중 제곱값을 최소로 유지한다는 것은 수학적 망 폐합과 관련이 됩니다. 간단히 말해서, 관측치의 각각을 조정함에 따라 모든 관측치의 총 조정(제곱)은 가능한 최소의 값이어야만 합니다.

검정 결과, 망 조정이 이 기준을 충족하지 못하는 경우, Trimble Geomatics Office 소프트웨어는 그 원인이 되는 관측치나 기준점을 모두 표시합니다.

망 조정의 용도와 목적

다음과 같은 작업 후에는 망 조정을 실시합니다.

  GPS 기선 처리 (원시 GPS 데이터의처리)

  RTK 기선(QC1 & QC2 데이터가 있는)이나 비GPS 데이터 가져오기

  허용 편차 밖의 오차로 인한 오류 플래그 제거

팁: 망 조정을 시작하기에 앞서 'Trimble Geomatics Office − Network Adjustment User Guide'의 부록 A, '최소 자승 조정 안내' 편을 꼭 읽도록 합니다.

참조: 망 조정의 수행 전에 GPS 사이트 캘리브레이션을 완료했거나 가져왔다면(DC 파일로부터) 망 조정에 앞서 그 GPS 사이트 캘리브레이션 매개 변수를 제거하겠다는 메시지가 나옵니다. Trimble Geomatics Office 소프트웨어에서 망 조정의 변환 매개 변수와 GPS 사이트 캘리브레이션의 매개 변수가 한 프로젝트에 같이 있을 수 없습니다. 그 중 하나만 두어야 합니다.

망 조정 절차

주요 망 조정 절차 2가지:

1.	먼저 최소 제약 조정(내적 제약 조건 이용시에는 자유 조정)으로써 관측치의 QC 점검을 조정, 수행합니다. 이 단계에서는:

  망의 내적 일관성을 확인합니다.

  과오나 부적절하게 맞추어진 관측치를 찾아냅니다.

  정확한 관측치 추정 오차를 얻습니다.

2.	완전 제약 조정을 수행합니다. 이 단계에서는:

  망을 기존 제어망(데이텀)에 참조시킵니다.

  기존 제어망의 유효성을 확인합니다.

  망 변환 매개 변수를 산출합니다.

  정확한 좌표 추정 오차를 얻습니다.

GPS 관측치와 비GPS 관측치가 결합된 망 조정의 수행 작업과 관련, 자세한 내용은 결합 조정 수행하기 항목을 참조하십시오.

참조: WGS-84 데이텀 상에서 GPS 관측치의 최소 제약 조정을 완료한 후, 그 조정된 포인트의 WGS-84 좌표를 저장할 수 있습니다. 이 WGS-84 좌표는 저장되었다가 GPS 사이트 캘리브레이션에서 GPS 점으로 이용됩니다. 완전 제약 조정에서 로컬 그리드 좌표(캘리브레이션의 그리드 점으로 쓰임)를 도출하고 나면,  캘리브레이션을 수행하여 외업(측설)에 적용할 수 있습니다. 또한 GPS 사이트 캘리브레이션을 하기 전에는 조정 변환 매개 변수를 제거하겠다는 메시지가 나옵니다. GPS 사이트 캘리브레이션을 시작하기 앞서 반드시 망 조정을 완료하도록 합니다. 자세한 내용은 GPS 사이트 캘리브레이션을 참조하십시오.

참조: Trimble Survey Controller 소프트웨어에서 데이터를 전송받아 망 조정을 수행하고자 하면 측량 작업시 그 Survey Controller 측량 스타일에 기압, 온도, 곡률 및 굴절 보정을 입력하도록 합니다


    데이텀 - 개요

추가 정보

방법 ...	기타
개요

데이텀은 지구 표면상에 있는 포인트의 좌표 결정에 쓰는 기준계입니다. 로컬 데이텀은 지역 좌표의 정의에 쓰고, 세계 데이텀은 전세계적인 좌표 정의에 사용합니다. 일반적으로, 측량 작업시 쓰는 기준점은 로컬 데이텀 기준의 로컬 좌표계를 토대로 하고, GPS 관측치는 WGS-84라는 세계 데이텀을 기준으로 하는 것입니다.

Trimble Geomatics Office 소프트웨어에서 프로젝트를 구성하여 그 등록 정보를 정의할 때, 특정 로컬 데이텀(프로젝트 데이텀) 기준의 프로젝트 좌표계를 선택합니다. 이 좌표계는 해당 데이텀과 더불어, 프로젝트에 있는 모든 포인트의 좌표 산출에 쓰입니다.

망 조정의 수행 전에 최소 제약 조정 단계와 완전 제약 조정 단계에서 적용할 데이텀을 선택할 수 있는데, 이것을 조정 데이텀이라 부릅니다. 조정 데이텀으로는 WGS-84 데이텀을 택할 수도 있고 프로젝트 데이텀을 선택할 수도 있습니다. 선택한 조정 데이텀은 해당 조정에만 적용됩니다.

GPS 관측치의 최소 제약 조정을 수행한다면 지구 측위 시스템의 기준 데이텀인 WGS-84 데이텀을 사용하도록 합니다. 다른 데이텀을 쓰면 조정 작업에서 각 관측치에 다소간의 잔차를 적용함으로써 기준계 차이를 보정하게 됩니다.

각 조정 단계에 있어 올바른 데이텀을 선택하여야 합니다. 즉,

  GPS 데이터로써 최소 제약 조정 단계를 실시하기 전에는 WGS-84 데이텀을 선택

  비GPS 데이터로써 최소 제약 조정 단계를 실시하기 전에는 프로젝트 데이텀을 선택(최소 제약 조정에 선택한 데이텀이 프로젝트 데이텀이 아닌 경우,  이 프로젝트 데이텀은 완전 제약 조정의 수행 전에 선택됩니다.)

참조: 일부 측량에서의 기준점은 WGS-84 데이텀의 좌표계를 기준으로 하므로 WGS-84를 프로젝트 데이텀으로 쓸 수 있습니다. 이 경우, 최소 제약 조정 단계와 완전 제약 조정 단계의 데이텀이 서로 같아집니다.

참조: 프로젝트 좌표계에 의거하여 그리드 좌표와 로컬 좌표의 요약이 항상 등록 정보 창에 표시됩니다. WGS-84를 조정 데이텀으로 선택하더라도 그리드 좌표와 로컬 좌표의 표시에는 아무 영향도 미치지 않습니다.

자세한 내용은 데이텀 선택하기를 참조하십시오.


    WGS-84 데이텀

추가 정보

방법 ...	기타
개요

GPS 관측치의 최소 제약 조정을 수행한다면 WGS-84 데이텀(지구 측위 시스템의 데이텀)을 사용하도록 합니다.

GPS 기선의 조정시 WGS-84 데이텀을 사용하지 않으면 가중 결과가 달라집니다. 이것은 기선의 모델링 과정에서 데이텀 차이값이 해당 관측치들에 고착되기 때문입니다.

자세한 내용은 데이텀 선택하기를 참조하십시오.


    프로젝트 데이텀

추가 정보

방법 ...	기타
개요

프로젝트 데이텀은 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭에서 선택합니다.

일단 최소 제약 조정을 수행한 후, 프로젝트 데이텀을 조정 데이텀으로 선택하도록 합니다.

완전 제약 조정 단계는 아래 작업에 필요한 변환 매개 변수를 적용합니다.

  GPS 관측치(WGS-84)를 로컬 좌표계(프로젝트 데이텀)에 참조

  비GPS 관측치를 로컬 기준망에 맞추기 위한 변환

이 조정 단계에서 기준점을 프로젝트 데이텀 기준으로 제약함으로써 WGS-84 기준의 관측치를 프로젝트 데이텀으로 변환할 수 있습니다.

자세한 내용은 데이텀 선택하기를 참조하십시오.


    관측치 그룹 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

관측치의 집합을 그룹으로 분리할 수 있습니다. 그룹의 유형은 다음과 같습니다.

  분산 그룹

  변환 그룹

관측치들을 그룹으로 분리하면 각 관측치 종류의 오차를 더욱 잘 평가할 수 있습니다.

분산 그룹

다양한 그룹의 측정치가 단일 망에서 쓰이는 경우가 있습니다. 따라서 조정에는 이 GPS 측정치들과 관련되는 서로 다른 오차를 설명하는 방법이 있어야 합니다. Trimble Geomatics Office 소프트웨어에서 분산 그룹은 이 관측치들을 그룹으로 분리하는 기능을 합니다.

정밀한 측량 방법일수록 측정 오차가 작아짐은 당연합니다.

조정 처리기는 각 그룹의 기준 계수와 자유도를 별도로 결정함으로써 전체 망 조정에 있어서의 그룹별 기여 정도를 나타냅니다. 각 그룹은 [가중 전략] 대화 상자의 [스칼라 적용 대상] 옵션을 '분산 그룹'으로 설정하면 개별적인 스케일링을 할 수 있습니다.

기본값으로, GPS 관측치와 비GPS 관측치, 지오이드 관측치는 기본 분산 그룹(<GPS 기본값> 그룹, < 비GPS 기본값> 그룹, <지오이드 기본값> 그룹)으로 자동 분리됩니다.

참조: <지오이드 기본값> 그룹은 어느 망 조정에서나 항상 하나밖에 없는 지오이드 분산 그룹입니다. 동일한 지오이드 모델로부터 각각의 지오이드 관측치를 보간할 때 쓰는 방식이 동일하기 때문에 이들을 여러 개의 그룹으로 분리할 필요가 없습니다

참조: 아주 짧은 선(25 m 미만) 상의 관측치에 대해서는 별도의 분산 그룹을 만듬으로써 다른 관측치와는 분리하여 스케일링을 합니다.

변환 그룹

변환 그룹은 조정 도중 동일한 변환 또는 변환 집합에 총괄적으로 소속되는 관측치의 그룹입니다. 각 변환 그룹에는 일단의 변환 매개 변수가 있는데 개별적으로나 또는 집합적으로 이를 적용하여 해당 변환 그룹 내의 관측치들을 변환합니다.

하나 또는 그 이상의 변환 매개 변수를 정의함으로써, 각 그룹에 적용되는 변환을 제어할 수 있습니다. 편향 매개 변수에만 변환을 적용하고자 하면 각 편향 매개 변수의 상태는 '계산'으로, 나머지 매개 변수의 상태는 그냥 '미사용'으로 둘 수 있습니다.

기본값으로, 다음 변환 매개 변수들은 GPS 관측치의 변환 그룹에 대하여 '계산'으로 설정됩니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

기본값으로, 방위각 회전만이 비GPS 관측치에 대하여 '계산'으로 설정됩니다. 기타 매개 변수는 '사용자 정의'나 '계산'으로 설정될 수 있지만 관측치에 정오차가 있는 경우에만 쓰도록 합니다. 예를 들어, 조정 후의 모든 거리(비GPS 방식으로 측정)에 공히 +3 ppm 잔차가 있다면 데이터 수집 도중 명백히 정오차가 발생한 것이므로 거리 축척 매개 변수가 계산될 수 있습니다. 이 정오차는 EDM의 ppm 설정이 적용되지 않았기 때문에 발생하였을 가능성이 있습니다.

참조: Trimble Geomatics Office 소프트웨어에서 사용자 정의 변환 매개 변수를 입력할 수는 있지만 그 전에 먼저 변환 매개 변수에 대하여 완벽히 이해하지 않으면 안됩니다.

변환 매개 변수에 대한 자세한 내용은 변환 매개 변수 � 개요를 참조하십시오.


    망 조정 보고서 - 개요

추가 정보

기타	대화 상자
개요

망 조정 도중 생긴 메시지와 통계 정보를 보는 대화 상자입니다.

이 보고서를 불러오려면

  [보고서 / 망 조정 보고서] 명령을 실행합니다.

사용자의 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다.

일단 이 보고서가 나오면 HTML 뷰어 명령을 이용하여 아래 섹션으로 이동해 갈 수 있습니다.

  조정 스타일 설정

  잔차 허용 범위

  공분산 표시

  비GPS 제어 옵션

  설치 오차

  통계 요약

  반복 연산 수

  종합 통계

  GPS 관측치 통계

  지오이드 모델 통계

  비GPS 관측치 통계

  가중 전략

  조정된 좌표

  그리드 좌표

  측지 좌표

  좌표 델타

  기준 좌표 비교

  조정된 관측치

  GPS 관측치

  지오이드 관측치

  비GPS 관측치

  표준 잔차의 히스토그램

  포인트 오차 타원

  공변항

상기 항목에는 보고서 통계의 평가 지침이 들어 있습니다.

참조: 망 조정 보고서에서 이상값 관측치를 선택하면 이들을 측량 보기 화면에서 선택할 수 있습니다. 방법: 망 조정 보고서로부터 관측치 ID를 선택합니다(여러 관측치를 선택하려면 Ctrl 키를 누름). 선택한 이 관측치가 측량 보기 화면의 현행 선택 부분을 대체합니다.


    조정 - 개요

추가 정보

방법 ...	기타
개요

조정 처리 작업을 시작하는 명령입니다.

조정을 시작하려면:

  측량 보기 화면에서 [조정 / 조정] 명령을 실행하거나

  F10을 누르거나

  프로젝트 표시줄에서 조정 그룹을 선택하여 [조정] 아이콘을 누릅니다.

모든 조정 반복 연산은 일단 처리가 시작되면 자동 수행됩니다. 상태 표시줄을 보면 망 조정의 상태를 파악할 수 있습니다. 즉, 각각의 조정 반복 연산이 수행됨에 따라 관련 메시지가 나옵니다.

조정은 조정 스타일에서 정한 최대 반복 연산 수만큼 이루어집니다. 소프트웨어는 매 반복 연산 도중 각 관측치의 잔차를 검정하여 해당 조정 스타일에서 정한 허용 범위에 부합하는지 여부를 결정합니다. 만일 망이 최대 반복 연산 수에 도달하기 전에 수렴하면 그 단계에서 조정 처리가 종료됩니다.

일단 관측치 잔차가 수용 검정 기준을 통과하면 망이 수렴하고 아래의 과정이 진행됩니다.

  망 조정에 있는 각 포인트의 조정된 값이 조정 등급 좌표값으로서 프로젝트에 저장됩니다.

  망 포인트 각각에 대한 좌표 서브 레코드가 추가로 만들어집니다. 서브 레코드의 유형은 다음과 같은 기준에 의해 결정됩니다.

  포인트가 망 조정에서 고정된 것이고, NGS 데이터 시트를 이용하거나 ASCII 파일의 기준점으로서 도입된 것이 아니라면, 사무실 입력 서브 레코드도 저장됩니다.

  망 조정의 각 포인트에 대한 조정 값은 조정 등급의 좌표 값이 됩니다. 제약된 포인트의 좌표와 포인트 등급(기준 등급)은 이전의 입력 상태 그대로 유지됩니다.

  망 조정의 각 포인트에 대하여 조정 좌표 페이지가 등록 정보 창에 만들어집니다. 포인트의 제약되지 않은 요소는 모두 조정 등급이 부여됩니다. 제약된 요소는 어느 것이나 공백값입니다.

  자동으로 재계산이 수행됩니다. 재계산은 모든 비망 포인트(non-network point)에 대하여 새 좌표를 결정합니다. 새 좌표는 비망 관측치로써 계산됩니다.

  조정된 포인트의 심벌이 노란색의 실선 원으로 바뀝니다.

  망 조정의 각 포인트에 대하여 오차 타원과 화살표가 생깁니다.

  망 조정의 기타 모든 포인트가 저장됩니다.

  조정된 포인트의 심벌이 바뀝니다. 그래픽 창이 검정색 배경이면 노란색의 실선 원이 나오고, 기본값 배경이면 파란색의 실선 원이 나옵니다.

  망 조정의 조정된 포인트 각각에 대하여 오차 타원이 생깁니다(고정된 수평 포인트에는 생기지 않음).

조정된 값을 각 포인트의 등록 정보 페이지에서 볼 수 있습니다. '오차 타원 표시' 옵션이 활성화되어 있으면 조정된 각 포인트에 대한 타원이 그래픽 창에서 표시됩니다.

이제 망 조정 보고서를 봄으로써 이 망 조정의 결과 분석을 시작할 수 있습니다


    가중 전략 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

가중 전략(Weighting Strategies)을 이용하면 각 관측치 종류(GPS, 비GPS, 지오이드)에 대하여 가중치와 크기를 적용하는 방법을 정의할 수 있습니다. Trimble Geomatics Office 소프트웨어에서는 각 관측치 종류별로 별도의 가중 전략을 정의할 수 있습니다.

관측치의 종류나 질 등급을 기준으로 하여 각 관측치에 가중치를 부여하는 것은 중요한 일입니다. 이렇게 하면 각 관측치의 추정 선험 오차를 올바르게 스케일링할 수 있게 됩니다. 가중 전략 정의시 다음과 같은 관측치에 스칼라를 적용할 수 있습니다.

  모든 관측치

  각 관측치

  분산 그룹

일반적으로 '모든 관측치'나 '분산 그룹'에 스칼라 형을 적용하게 되는데, 어느 것이 쓰일지는 측량시의 사용 방법 여하에 따라 달라집니다. [스칼라 적용 대상] 옵션을 '각 관측치' 방식으로 설정하면 '사용자 정의' 스칼라 형 옵션이 해제됩니다. 스칼라를 각 관측치에 적용하는 것은 흔히 분석 용도에만 쓰입니다. 즉, 망 조정에서 문제를 야기하는 특정 관측치를 찾아내는 데 도움이 됩니다.

일단 이 스칼라 값 적용 방식을 정한 후에는 해당 조정에서 쓸 스칼라 형을 정의할 수 있습니다. 선택 가능한 스칼라 형:

  기본값

  대체

  사용자 정의

  자동

일부 망 조정에서는 관측치의 그룹에 계산되는 추정 선험 오차가 과소 산정되는 경우가 있습니다. 정확한 가중 전략을 적용하면 추정 선험 오차의 크기를 스케일링 함으로써 모든 관측치의 오차를 올바로 추정할 수 있습니다.

조정 작업을 시작할 때, 설정되는 기본 가중 전략은 '기본값' 스칼라 형을 '모든 관측치'에 적용하는 것입니다. 기본값 스칼라는 선험 오차를 단순히 1.00으로 곱함으로써 그 추정 오차를 변경하지 않고 그냥 둡니다.

관측치의 추정 오차가 실제 오차에 부합하는 경우, 보고서에 표시되는 기준 계수는 약 1.00이어야 합니다. 망 조정을 수행했을 때 기준 계수가 1.00에 근접하지 않는 경우가 있는데, 이는 추정 오차를 실제 오차에 일치시키려면 스케일링이 필요하다는 의미입니다. 가장 간단한 스칼라 적용 방식은 '대체' 스칼라 형을 선택하는 것입니다. '대체' 스칼라 형은 현행 조정의 기준 계수에 이전 스칼라를 곱함으로써 그 다음 조정의 스칼라를 결정합니다. 이것은 효과적으로 기준 계수를 1.00에 근접하게 합니다. '대체' 스칼라 형은 기준 계수가 약 1.00이 되고 카이 자승 검정을 통과할 때까지 후속 조정에 계속 적용됩니다. '자동' 스칼라 형 옵션은 이 과정을 자동화합니다.

참조: '대체' 스칼라 형은 첫 조정의 기준 계수가 수용 가능한 값이어야만 적용할 수 있습니다. 통상적으로, 큰 기준 계수는 조정에 큰 오차가 있음을 의미하므로, 그 다음 조정을 시작하기 전에 이상값(즉, 잔차가 큰 관측치)을 체크하도록 합니다. 기준 계수가 큰 조정에 '대체' 스칼라 형을 적용하면 해당 스칼라 값이 수용 불가능한 수준으로 증가됩니다.

기준 계수가 수용 가능한 값이어서 카이 자승 검정을 통과하게 되면 이 최종 계산 스칼라를 고정(lock)할 수 있습니다. 스칼라를 고정하면 스칼라 형이 '사용자 정의'로 자동 변경됩니다.

주의: '사용자 정의' 스칼라 형을 선택하여 스칼라 값을 입력할 때에는 주의를 요합니다. 추정 오차나 가중 전략, 스칼라 등의 개념을 완전히 이해한 다음, '사용자 정의' 스칼라 형을 적용하여야 합니다.


    명령 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

망 조정의 수행에 필요한 명령은 모두 [조정] 메뉴에 있습니다. 망 조정 보고서를 작성하는 명령은 [보고서] 메뉴에 있습니다. 아래에는 일반적인 조정 수행 단계의 순서대로 망 조정 명령이 나열되어 있으므로 순차적인 망 조정 안내를 받을 수 있습니다.

[조정] 메뉴에 나오는 망 조정 명령:

  데이텀

  WGS-84 (데이텀)

  프로젝트 데이텀

  조정 스타일

  포인트

  관측치

  관측치 그룹

  변환 그룹

  분산 그룹

  가중 전략

  조정

  캘리브레이션 좌표

  저장 (캘리브레이션 좌표)

  제거 (캘리브레이션 좌표)

  조정 제거

[보기 / 도구 모음]의 하위 메뉴에 나오는 명령:

  타원 제어

참조: [오차 타원] 명령을 선택하는 것이나 [보기 옵션] 대화 상자 / [오차 타원 제어] 탭에서 '포인트 오차 타원과 화살표 표시' 확인란을 선택하는 것이나 그 기능이 동일합니다.

타원 제어 도구 모음에 나오는 명령:

  오차 타원

  고도 오차

  표고 오차

[보고서] 메뉴에 나오는 명령:

  망 조정 보고서

[관측치] 대화 상자에 나오는 명령:

  관측치 불이용

참조: [관측치 불이용] 명령은 등록 정보 창에서 관측치 상태를 '블이용'으로 변경하는 것과 마찬가지입니다. 이용 해제된 관측치는 등록 정보 창에서만 이용 상태로 다시 설정할 수 있습니다. 자세한 사항은 관측치의 이용 해제 및 이용 해제된 관측치의 재이용을 참조하십시오.


    변환 매개 변수 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

변환은 개별 변환 그룹의 변환 매개 변수 설정에 의거, 완전 제약 조정 단계에서 계산, 적용됩니다. 각 변환 그룹은 관측치(GPS나 비GPS, 지오이드)와 관련 변환 매개 변수(계산해서 변환 그룹 관측치에 적용)들로 구성됩니다.

각 변환 그룹에는 7개의 매개 변수가 있습니다. 이 매개 변수마다  [값] 필드(완전 제약 조정시 적용하는 변환 매개 변수 값의 정의에 선택적으로 이용)가 하나씩 있습니다. 각 [값] 필드는 관련된 상태 설정이 있는데, 이것은 [값] 필드의 값 상태('미정의', '계산', '사용자 정의')를 설정합니다.

매개 변수 7개:

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

일반적으로 처음 4개의 매개 변수는 WGS-84 데이텀을 프로젝트(로컬) 데이텀으로 변환하는 것과 같은 데이텀 변환에 쓰입니다. 경도/위도 편향은 평면 기울기를 결정하고, 방위각 회전과 망 축척은 방위각과 모든 선형(거리 및 고도) 관측치에 각각 적용됩니다.

나머지 3개의 매개 변수는 어떤 그룹의 관측치에 있을 수 있는 정오차를 해결하는 데 쓰입니다.

기본값으로, 다음 변환 매개 변수들은 GPS 관측치의 변환 그룹에 대하여 '계산'으로 설정됩니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

기본값으로, 방위각 회전만이 비GPS 관측치에 대하여 '계산'으로 설정됩니다. 기타 매개 변수는 '사용자 정의'나 '계산'으로 설정될 수 있지만 관측치에 정오차가 있는 경우에만 쓰도록 합니다. 예를 들어, 조정 후의 모든 거리(비GPS 방식으로 측정)에 공히 +3 ppm 잔차가 있다면 데이터 수집 도중 명백히 정오차가 발생한 것이므로 거리 축척 매개 변수가 계산될 수 있습니다. 이 정오차는 EDM의 ppm 설정이 적용되지 않았기 때문에 발생하였을 가능성이 있습니다.

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다.

상태를 '계산'으로 설정한다고 해서 그 매개 변수가 완전 제약 조정시 계산되어 적용되는 것은 아닙니다. 소프트웨어는 망 제약 조건의 수를 검토하여 매개 변수 계산에 필요한 만큼의 제약 조건이 있는지 판단합니다. 예를 들어 편향 매개 변수의 경우, 망에서 최소 3개의 수직 좌표를 고정할 필요가 있습니다. 고정된 수직 좌표가 3개 미만이면 편향 매개 변수는 계산되거나 적용되지 않습니다.

'사용자 정의' 상태 설정 하에서는 변환 그룹에 적용될 매개 변수의 일부 또는 전부를 사용자가 직접 정의할 수 있습니다. 즉, 조정 과정에서 계산되는 값이 아니라 사용자가 입력한 값이 관측치에 적용됩니다.

참조: Trimble Geomatics Office 소프트웨어에서 사용자 정의 변환 매개 변수를 입력할 수는 있지만 그 전에 먼저 변환 매개 변수에 대하여 완벽히 이해하지 않으면 안됩니다.

망 조정 보고서를 만들 때 매개 변수의 상태에 따라 그 값의 보고 방식이 달라집니다.

  상태가 '미사용'으로 설정된 매개 변수는 그 값이 보고서의 [조정된 관측치] 섹션에 나오지 않습니다. .

  '계산' 상태이지만 제약 조건이 불충분하여 계산해 낼 수 없는 매개 변수의 값은 보고서의 [조정된 관측치] 섹션에 나오지 않습니다. 일단 그 매개 변수를 계산할 수 있게 되면 그 때부터 이 섹션에 나옵니다.

  '사용자 정의' 상태인 매개 변수는 제약 조건의 수에 상관 없이 그 입력 값이 보고됩니다.

팁: 변환 매개 변수는 프로젝트 등록 정보 창의 상세한 좌표계 등록 정보에 있는 [조정] 탭에서도 볼 수 있습니다.

참조: 관측치를 선택하면 등록 정보 창에 표시됩니다. 조정되거나 변환된 관측치는 등록 정보 창에 나오지 않습니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    캘리브레이션 좌표 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

캘리브레이션 좌표를 저장하면 포인트에 대하여 WGS-84 데이텀 기준의 GPS 좌표를 저장할 수 있게 됩니다. 이 좌표들은 최소 제약 조정을 마친 후 저장됩니다.  로컬 데이텀 상의 완전 제약 조정을 마친 후에는 해당 포인트의 그리드 좌표를 저장할 수 있습니다.

참조: '캘리브레이션 좌표 저장' 옵션은 조정 데이텀이 WGS-84로 설정되어 있고, GPS 관측치만 조정한 경우에 한해 이용할 수 있습니다.

캘리브레이션 좌표를 만드는 방법 2가지:

  기존 포인트

  접미어가 붙은 새 포인트

[캘리브레이션을 위한 좌표 저장] 상자에서의 두가지 옵션:

기존 포인트

기존 포인트 하에 저장하는 옵션을 택할 경우, 그 포인트 레코드 하에 좌표가 저장됩니다. 이 좌표는 이용 가능한 다른 측량 데이터가 없을 때에만 포인트 측위에 쓰입니다. 이들은 캘리브레이션 전용으로 저장됩니다.

포인트는 기존 포인트 하에 저장하면 [GPS 사이트 캘리브레이션] 대화 상자의 [포인트 목록]에 자동으로 들어갑니다.

접미어가 붙은 새 포인트

'GPS'를 접미어로 하는 새 포인트 하에 저장하기로 하면 이름이 '<포인트 이름 >-GPS'인 새 포인트가 생깁니다. 이 좌표는 이용 가능한 다른 측량 데이터가 없을 때에만 포인트 측위에 쓰입니다. 이들은 캘리브레이션 전용으로 저장됩니다.

이 옵션은 GPS 사이트 캘리브레이션용의 GPS 점과 그리드 점을 별개의 개체로서 유지하고자 할 때 이용합니다.

캘리브레이션 좌표 보기

캘리브레이션 좌표를 일단 프로젝트에 저장하게 되면 등록 정보 창에서 그 캘리브레이션 점의 등록 정보를 볼 수 있습니다.

캘리브레이션 좌표 제거하기

캘리브레이션 좌표의 제거도 가능합니다. [조정] 메뉴의 [캘리브레이션 좌표] 명령에는 하위 메뉴가 나오는데, 그 가운데 [제거] 명령을 실행하면 캘리브레이션 좌표를 프로젝트에서 없앨 수 있습니다.


    망 조정으로 생기는 좌표 페이지

추가 정보

 기타

개요

망 조정시, 제약되지 않은 망 포인트 각각에 대하여 조정된 좌표가 생기는데 등록 정보 창에서 이 좌표를 볼 수 있습니다.

이 좌표는 이용하는 조정 데이텀을 기준으로 하여 도출됩니다. 예를 들어,

  망 조정이 WGS-84 데이텀에서 이루어지면 조정 WGS-84 좌표가 생깁니다.

  망 조정이 프로젝트 데이텀에서 이루어지면 조정 그리드 좌표가 생깁니다.

참조: [포인트] 대화 상자에서 고정된 좌표는 고정 기준 등급 [image] 이 부여됩니다. 이 좌표는 수정할 수 없습니다.

조정 등급 좌표는 미고정 기준 좌표에 우선하여 쓰입니다. 이들은 추가 조정 전에, 그리고 해당 조정의 제거시 없어지게 됩니다.


망 조정에서 좌표 균질화의 중요성

Trimble Geomatics Office 프로젝트에서 데이터를 조정하기 전, 먼저 양질의 기준점을 가져오지 않으면 안됩니다. 소프트웨어에 데이터를 가져온 다음, 도입 포인트의 계산 위치를 결정하기 위하여 재계산을 하여야 하는데, 이 때 기준점이 필요하기 때문입니다.

불량한 개시 좌표는 기선 모델링 과정에서 부적절한 관측치 스케일링의 원인이 되고, 나아가 망 조정에서 오류 결과값을 초래합니다. 수직 좌표 오류는 이 모델링 과정에서 스케일링 오류로 연결됩니다.

불량 좌표가 망 조정으로 파급되는 것을 방지하려면 반드시,

  좌표 등급이 높은 관측치를 이용하고

  데이터의 질이 균일(homogeneous)하도록 합니다. 즉, 데이터에 큰 폐합 오차가 없어야 합니다.

프로젝트에 폐합 오차가 있는 상태에서 망 조정을 시도하면 [이질적 데이터 경고] 대화 상자가 나옵니다. 최소 제약 조정을 하기 전에 데이터의 이질성을 해소하도록 합니다.

참조: 이질성 확인 작업은 '기본값' 스칼라의 조정에서만 이루어집니다. 데이터를 수정하고 조정을 하고자 할 경우, 반드시 [가중 전략] 대화 상자에서 '기본값' 스칼라 옵션([GPS], [비GPS], [지오이드] 탭에서)을 선택하도록 합니다.


조정 실패 오류 메시지

개요

망 조정시 나올 수 있는 오류 메시지:

  조정 실패 − 수렴 안됨

  조정 실패 − 수평이나 수직 좌표 불안정

  조정 실패 − 변환 불안정

이 3가지 오류가 발생하는 원인은 여러 가지입니다. 오류 메시지를 토대로 어느 포인트가 문제인지 알아낸 다음, 해당 데이터를 검사합니다.

조정 실패 − 수렴 안됨

한 반복 연산에서 그 다음의 반복 연산으로 진행하더라도 조정되는 포인트의 좌표가 바뀌지 않을 때 조정이 완료됩니다. 이 메시지는 망 조정 포인트의 좌표가 잔차 허용 범위 이상으로 변경하고 있을 때 나옵니다. 조정 수렴을 막는 어떤 과오(blunder)가 데이터에 있을지 모릅니다. 예를 들어,

  포인트의 미조정 좌표가 조정 값에 근접하지 않을 가능성

  관측치에 오류가 있을 가능성(예: 관측 방위각이 실제보다 180도 더 작거나 큰 경우)

모든 과오는 조정 전에 확실히 제거할 필요가 있습니다.

또한 이 메시지는 관측 거리가 25m 미만인 망 각도가 그 원인일 수도 있습니다. '반복 연산 종료의 잔차 허용 범위'를 상향 조정하여 변경 좌표(1.0 e-3 m)가 수용될 수 있도록 합니다.

조정 실패 − 수평이나 수직 좌표 불안정

이 메시지는 조정 계산 과정의 수학적 오차가 원인입니다.

이 메시지를 보면 수평 좌표가 문제인지 아니면 수직 좌표가 문제인지, 그리고 어느 포인트가 오류의 원인인지를 알 수 있습니다. 망을 검토하고 문제의 포인트를 찾은 다음, 데이터를 검사하도록 합니다.

조정 실패 − 변환 불안정

조정 계산 과정의 수학적 오차가 그 원인입니다. 이 메시지에는 문제를 야기한 매개 변수와 그 변환 그룹 이름이 나옵니다.

이 메시지는 망의 GPS 부분이 비GPS 부분과 완전히 통합되지 않을 때 나올 수 있습니다. 예를 들어, GPS/비GPS 관측치의 결합망에서 비GPS 부분의 구성 요소 중 서로 연결되지 않는 것이 2개 이상일 경우, 발생할 수 있습니다. 자세한 내용은 상이한 종류의 관측치를 망 조정에서 결합하기를 참조하십시오.

GPS 관측치와 비GPS 관측치를 결속하기에 충분한 수의 관측치가 있도록 하거나 GPS 변환 기능을 해제하도록 합니다. 망의 GPS 부분과 직접 연결되는 포인트의 좌표를 제약함으로써 이 문제를 해결할 수도 있습니다.


    [망 조정 스타일] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

이 대화 상자를 이용하여 조정 스타일의 보기, 만들기, 선택, 복사, 편집, 이름 변경, 삭제 등의 작업을 합니다. 현재 이용 중인 스타일을 활성 스타일이라 하는데 이 스타일의 설정이 항상 다음 조정에 적용됩니다.

스타일 라이브러리를 만들어 서로 다른 유형의 조정을 수행하고 이 스타일들을 여러 프로젝트 사이에서 공유할 수 있습니다.

[망 조정 스타일] 대화 상자를 불러오려면

  [조정 / 조정 스타일] 명령을 실행합니다.

가능한 옵션:

활성 스타일

현재 망 조정에 이용 중인 활성 스타일이 이 필드에 나옵니다. 스타일 목록에서 활성 스타일을 새로 선택하면 이 새 스타일이 [활성 스타일] 필드에 나오게 됩니다. 이 필드는 보기용으로서 수정은 할 수 없습니다.

스타일 목록

이 목록에서 활성 스타일을 선택합니다. 일단 어떤 스타일이 활성화되면 대화 상자의 오른쪽에 있는 단추를 눌러 그 스타일의 편집이나 복사, 이름 변경, 삭제 등의 작업을 할 수 있습니다.

스타일을 하나 선택하고 [확인] 단추를 누르면 그 스타일이 조정용 활성 스타일로 됩니다.

Trimble Geomatics Office 소프트웨어에는 사전 정의된 스타일이 여러 개 딸려 있습니다. 이것들을 복사한 후, 적절히 수정함으로써 새로운 스타일을 만들 수도 있고, 아니면 처음부터 사용자 자신의 스타일을 만들 수도 있습니다. 어느 조정 스타일이든 편집이 가능합니다.

이 목록에 있는 스타일들은 프로젝트에 저장되는 것이 아니라 Windows 레지스트리에 저장되므로 여러 프로젝트에 쓰이게 됩니다.

편집

스타일을 편집할 때 쓰는 단추입니다. [편집] 단추를 누르게 되면 스타일 목록에서 선택한 파일이 활성 스타일로 되면서 [조정 스타일 편집] 대화 상자가 나옵니다.

새로 만들기

새로운 조정 스타일을 만들고자 할 때 이 단추를 누릅니다. [새 스타일] 대화 상자가 나옵니다.

이름을 붙이면 이 새 스타일이 활성 스타일로 되면서 [조정 스타일 편집] 대화 상자가 나옵니다. 자세한 내용은 스타일 만들기를 참조하십시오.

참조: 새 스타일을 만들 때 '95% 신뢰도 한계' 스타일이 기본값 스타일로 쓰입니다.

복사

활성 스타일을 복사한 다음, 이것을 토대로 새로운 조정 스타일을 만듭니다. 이 단추를 누를 때, 그 스타일의 복사본이 활성 스타일로 되면서 [스타일 복사] 대화 상자가 나옵니다.

새 스타일에 이름을 붙이면 [조정 스타일 편집] 대화 상자가 나옵니다. 자세한 내용은 스타일 복사하기를 참조하십시오.

이름 변경

이 단추를 누르면 [스타일 이름 변경] 대화 상자가 나옵니다. [이름] 필드에 새 스타일의 이름을 입력하고 [확인] 단추를 누르면 Windows 레지스트리에 있는 그 스타일 이름이 바뀝니다. 이제 이름 변경된 스타일이 활성 스타일로 되고 그 새 이름이 [활성 스타일] 필드에 나옵니다. 자세한 내용은 스타일 이름 변경하기를 참조하십시오.

삭제

활성 스타일을 삭제하고자 할 때 이 단추를 누릅니다. 삭제한 스타일은 Windows 레지스트리에서 영구 제거되므로 더 이상 이용할 수 없습니다. 자세한 내용은 스타일 삭제하기를 참조하십시오.


    [조정 스타일 편집] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

활성 조정 스타일을 보거나 편집하는 대화 상자입니다.

이 대화 상자를 불러오려면:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집]을 누릅니다.

[조정 스타일 편집] 대화 상자가 나옵니다.

탭의 종류:

일반

잔차 허용 범위, 시그마 스칼라, 조정 스타일의 일반 등록를 보거나 편집하는 탭입니다. 자세한 내용은 일반을 참조하십시오.

공분산 표시

조정 스타일에 대한 2차원 및 3차원의 공분산 표시 옵션을 보거나 편집하는 탭입니다. 자세한 내용은 공분산 표시를 참조하십시오.

비GPS 제어 옵션

표준 오차 설정을 보거나 편집하고 어떤 조정(수평이나 수직, 또는 둘 다)을 수행할지 정하는 탭입니다. 자세한 내용은 비GPS 제어 옵션을 참조하십시오.

설치 오차

안테나 높이와 안테나 센터링, 기계고, 측량기 센터링(연직 작업)의 알려진 오차를 보거나 편집하는 탭입니다. 이 정의는 조정 계산시 오차를 보정하기 위하여 모든 관측치에 빠짐없이 적용되게 됩니다. 자세한 내용은 설치 오차를 참조하십시오.


    [조정 스타일 편집] 대화 상자 - [일반] 탭

추가 정보

방법 ...	대화 상자	기타
개요

잔차 허용 범위, 시그마 스칼라, 조정 스타일의 일반 등록 정보를 정의하는 탭입니다..

이 탭을 액세스 하는 방법:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집]을 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[일반] 탭을 선택합니다.

가능한 옵션 3가지:

Reduced Column Profile 이용

망 조정에 필요한 컴퓨터 메모리의 양을 줄이려면 이 확인란을 선택합니다. 큰 망의 경우, 이 옵션을 적용하면 조정 완료에 소요되는 시간이 짧아집니다.

참조: 이 옵션은 U.S. National Geodetic Survey(NGS)에서 개발한 알고리즘의 조합을 사용합니다.

관측치와 연결되지 않는 포인트 사이의 공변항이 표시되지 않는다는 점을 제외하고는 'Reduced Column Profile 이용' 옵션이 조정 결과에 미치는 영향은 없습니다.

이 옵션의 이용시, 수평 기준점과 수직 기준점을 최소한 하나씩 고정하지 않으면 안됩니다.

자유 조정(고정 좌표가 없는 조정)을 수행한다면 이 옵션을 이용할 수 없습니다. 자유 조정의 경우, [일반] 탭 하의 이 확인란은 무시되므로 Reduced Column Profie없이 조정이 진행됩니다.

공변항을 관측선에 한정

이 확인란을 선택하면 공변항의 표시를 제한할 수 있는데, 관측치와 연결되지 않는 포인트 사이의 공변항을 표시하지 않는다는 점을 제외하고는 최종 조정 결과에  아무 영향도 미치지 않습니다.

이 확인란을 선택하지 않으면, 망 포인트 쌍의 가능한 모든 순열 사이에 공변항이 계산됩니다. 따라서 망이 큰 경우에는 조정 보고서에 나오는 공변항 목록이 아주 많아질 수 있습니다.

지오이드 모델의 상관도 계산

지오이드 관측치를 망에 사용할 경우, 수직 좌표(고도, 표고)를 계속 고정해 두도록 합니다. 그러면 과결정 해가 존재할 수 있고 그 제약 포인트에 대한 지오이드 잔차가 계산될 수 있습니다.

이 확인란을 선택하면 미제약(unconstrained) 수직 좌표가 있는 포인트들은 이들 사이의 지오이드 모델 상관 관계를 토대로 하여 지오이드 잔차가 계산되게 됩니다.

이 확인란을 선택하지 않으면 높이와 표고가 고정된(fixed) 포인트에 대해서만 잔차가 계산됩니다.

잔차 허용 범위

망 조정 작업에 쓸 잔차 허용 범위를 설정하는 옵션입니다. 자세한 내용은 잔차 허용 범위를 참조하십시오.

시그마 스칼라

목록에서 한 옵션을 선택하여 단변량과 2변량 시그마 스칼라를 설정합니다. 자세한 내용은 시그마 스칼라를 참조하십시오.

최대 반복 연산 수

망의 수렴 작업시 허용되는 최대 반복 연산 횟수를 입력합니다. 기본값은 10입니다.


    잔차 허용 범위

추가 정보

 기타

개요

망 조정 작업에 쓸 잔차 허용 범위를 설정하는 옵션입니다. 망 조정은 반복 연산 과정으로서, 매 조정 반복 연산 단계마다 이 잔차 허용 범위를 토대로 하는 수렴 확인 절차를 밟습니다.

반복 연산 종료

조정 반복 연산의 계속/중단 여부 결정에 쓸 잔차 허용 범위를 입력합니다.

망 조정의 반복 연산(Iteration)이 1 회씩 끝날 때마다 소프트웨어의 서로 다른 두가지 루틴을 바탕으로 관측 잔차가 계산됩니다. 이 두 계산의 차이값은 '반복 연산 종료 허용 편차'와 비교되는데, 이 때:

  계산 관측 잔차간의 차이가 '반복 연산 종료 허용 편차'보다 작으면 조정 반복 연산 작업이 중지됩니다. 망 조정 보고서에 �# 회 반복 연산에서 조정 성공� 이라는 메시지가 나옵니다. 여기서 #는 이 망의 수렴에 필요했던 반복 연산의 수입니다.

  계산 관측 잔차간의 차이가 '반복 연산 종료 허용 편차'보다 크면 조정 반복 연산 작업이 계속됩니다. '최대 반복 연산 수'에 도달할 때까지 조정 작업이 계속되면 '최종 수렴 차단'이 적용됩니다(아래 참조).

최종 수렴 차단

망 조정의 최종 반복 연산에 대한 '수렴 차단 허용 편차'를 입력합니다. 이 값은 마지막 반복 연산 작업이 '반복 연산 종료 허용 편차'를 통과하지 못할 경우, 소프트웨어가 망 조정의 성공 여부를 판단함에 이용합니다.

마지막 반복 연산에 대한 관측 잔차의 계산 차이값이 '반복 연산 종료 허용 편차'보다 크면 그 잔차는 '최종 수렴 차단(Final Convergence Cutoff)'과 비교되는데, 이 때:

 계산 관측 잔차간의 차이가 '최종 수렴 차단'보다 작으면 망 조정이 성공입니다. 망 조정 보고서에 �# 회 반복 연산 후 최종 수렴 성공(최종 수렴 차단 적용)�이라는 메시지가 나옵니다. 여기서 #는 이 망의 수렴에 필요했던 반복 연산의 수입니다.

 이 관측 잔차가 '최종 수렴 차단'보다 크면 망 조정이 실패이므로 "조정 실패. 수렴 안됨"이라는 경고 메시지가 나옵니다.

이 메시지들은 망 조정 보고서에도 기록됩니다.

[최대 반복 연산 수] 필드의 입력 값은 반복 연산을 최종적으로 종료하는 시점을 결정합니다. 반복 연산 수나 [반복 연산 종료] 필드, [최종 수렴 차단] 필드를 변경할 경우에는 주의를 요합니다.


    시그마 스칼라

추가 정보

 기타

개요

이 옵션을 이용하여 단변량 과 2변량 시그마 스칼라를 설정합니다. 단변량 시그마 스칼라는 모든 1차원 오차(관측치와 좌표 구성 요소, 수평 정밀도 등에서의 전파 오차)에 적용되고, 2변량 시그마 스칼라는 모든 2차원 오차 타원에 적용됩니다.

기본값으로, 모든 전파 오차는 2 시그마 표준 오차(단변량과 2변량 시그마 스칼라에 대한 95%의 신뢰도에 해당)에서 표시됩니다.

가능한 옵션:

단변량(Univariate)

관측치와 좌표 구성 요소, 수평 정밀도 등에서의 모든 전파 오차에 적용할 단변량 시그마 스칼라를 이 목록에서 선택합니다. 이들은 모두 1차원 오차입니다.

US, Bomford, Spherical 방식에서 가능한 옵션:

  1.000 (68%)

  1.646 (90%)

  1.960 (95%)

  2.575 (99%)

2변량(Bivariate)

모든 오차 타원에 적용할 2변량 시그마 스칼라를 이 목록에서 선택합니다. 오차 타원은 2차원 오차의 그래픽적 표시입니다.

가능한 옵션:

  1.000 (39%)

  2.147 (68%)

  2.447 (95%)

  3.035 (99%)


    [조정 스타일 편집] 대화 상자 -  [공분산 표시] 탭

추가 정보

방법 ...	대화 상자	기타
개요

이 탭을 이용하여 망 조정 스타일에 대한 2차원이나 3차원의 공분산 표시 옵션을 정의합니다.

[공분산 표시] 탭의 액세스 방법:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집] 단추를 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[공분산 표시] 탭을 선택합니다. 공분산 표시 옵션이 나옵니다.

가능한 옵션:

수평

망 조정 스타일에 대한 2차원의 공분산 표시 옵션을 정의합니다. 자세한 내용은 수평을 참조하십시오.

3차원

망 조정에 대한 3차원의 공분산 표시 옵션을 정의합니다. 자세한 내용은 3차원을 참조하십시오.


    수평 (공분산 표시)

추가 정보

 기타

개요

망 조정에 대한 2차원의 공분산 표시 옵션을 정의합니다.

정밀도 표현 형식

이 목록을 이용하여 수평(2D) 정밀도(P)를 비례 오차로서 표현하는 방식을 정의합니다. 수평 정밀도에 있어 거리는 포인트간 수평 거리입니다.

선택 옵션:

  PPM − 수평 정밀도를 '백만분의 X' 단위로 표시(여기서 X = 거리 � P � 1.0e-06).

  비율 − 수평 정밀도를 'X 분의 1' 단위로 표시(여기서 X = 거리 � P)

  없음 − 수평 정밀도 표시 기능을 해제함

참조: 정밀도 계산식:

(E x S)2 = C2 + P2

여기서:

E : 전파 선형 오차

S : 전파 선형 오차 스칼라

C : 상수 오차항

P : 정밀도

전파 선형 오차(Propagated Linear Error)

이 목록에서 망 조정 스타일의 수평(2차원) 전파 선형 오차를 정의합니다. 계산되는 전파 선형 오차는 단변량 및 2변량 시그마 스칼라에 상관없이 1 시그마로 표시됩니다.

선택 옵션:

  US − 조정 수평 거리(2D)나 사거리(3D)의 표준 오차를 이용하는 옵션

  Canadian − 2D(또는 3D) 상대 오차 타원의 최대 장반경을 이용하는 옵션

  Bomford − 2D(또는 3D) 상대 오차 분산 합의 제곱근을 이용하는 옵션

  Spherical − 2D(또는 3D) 상대 표준 오차의 평균을 이용하는 옵션

상수항(Constant Term)

상수항은 프로젝트 등록 정보에서 설정된 프로젝트 단위로 지정하여야 합니다. 이 항의 범위는 0.0 m(0.0 usft)에서 0.1 m(0.3 usft)까지입니다.

선형 오차 스칼라 (Scalar on Linear Error)

원하는 신뢰도 수준으로 정밀도를 스케일링 하기 위한 수평(2차원) 스칼라를 정의합니다. 상대 공분산 행렬의 스케일링을 위하여 전파 선형 오차가 제곱됩니다.

US, Bomford, Spherical 방식에서 가능한 옵션:

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

Canadian 방식에서 가능한 옵션:

  1.000 (39%)

  2.147 (90%)

  2.447 (95%)

  3.035 (99%)


    3차원 (공분산 표시)

추가 정보

 기타

개요

망 조정에 대한 3차원의 공분산 표시 옵션을 정의합니다.

정밀도 표현 형식

3차원(3D) 정밀도(P)를 비례 오차로서 표현하는 방식을 선택합니다. 3차원 정밀도에 있어 거리는 포인트간 사거리입니다.

선택 옵션:

  PPM − 수평 정밀도를 '백만분의 X' 단위로 표시(여기서 X = 거리 � P � 1.0e-06).

  비율 − 수평 정밀도를 'X 분의 1' 단위로 표시(여기서 X = 거리 � P)

  없음 − 수평 정밀도 표시 기능을 해제함

참조: 정밀도 계산식:

(E x S)2 = C2 + P2

여기서:

E : 전파 선형 오차

S : 전파 선형 오차 스칼라

C : 상수 오차항

P : 정밀도

전파 선형 오차(Propagated Linear Error)

이 목록에서 망 조정 스타일의 3차원 전파 선형 오차를 정의합니다.

계산되는 전파 선형 오차는 단변량 및 2변량 시그마 스칼라에 명시된 값에 상관없이 1 시그마로 표시됩니다.

선택 옵션:

  US − 조정(수평(2D)이나 경사(3D)) 오차의 표준 오차를 이용하는 옵션

  Canadian − 2D(또는 3D) 상대 오차 타원의 최대 장반경을 이용하는 옵션

  Bomford − 2D(또는 3D) 상대 오차 분산 합의 제곱근을 이용하는 옵션

  Spherical − 2D(또는 3D) 상대 표준 오차의 평균을 이용하는 옵션

상수항(Constant Term)

상수항은 프로젝트 등록 정보에서 설정된 프로젝트 단위로 지정하여야 합니다. 이 항의 범위는 0.0 m(0.0 usft)에서 0.1 m(0.3 usft)까지입니다.

선형 오차 스칼라 (Scalar on Linear Error)

원하는 신뢰도 수준으로 정밀도를 스케일링 하기 위한 3차원 스칼라를 정의합니다. 상대 공분산 행렬의 스케일링을 위하여 전파 선형 오차가 제곱됩니다.

US, Bomford, Spherical 방식에서 가능한 옵션:

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

Canadian 방식에서 가능한 옵션:

  1.00 (20%)

  2.50 (90%)

  2.80 (95%)

  3.37 (99%)

가능한 경우 표고 오차 적용

이 확인란은 3차원 정밀도의 계산시 표고 오차를 적용할지, 아니면 타원체 고도 오차를 적용할지를 결정합니다.

3차원 정밀도의 계산에 표고 오차를 쓰려면 이 확인란을 선택하고, 타원체 고도 오차를 적용하려면 이 확인란을 선택하지 않습니다.

이 확인란이 선택되어 있는 경우(기본값임), 표고 오차는 로드한 지오이드 관측치가 있는 경우에만 계산에 적용되고, 따라서 사용자가 표고를 계산할 수 있게 됩니다. 고정 수직 기준점의 질과 선택 지오이드 모델의 질에 문제가 없다고 확신하는 경우에는 이 확인란의 기본값 상태를 그대로 유지합니다.

프로젝트 등록 정보의 선택 지오이드 모델이 없는 경우에는 이 기본값 설정 상태가 무시되고 타원체 고도 오차가 3차원 정밀도의 계산에 쓰입니다.


    [조정 스타일 편집] 대화 상자 - [설치 오차] 탭

추가 정보

방법 ...	대화 상자	기타
개요

안테나 높이와 안테나 센터링, 기계고, 측량기 센터링(연직 작업)에 있는 알려진 오차를 정의하는 탭입니다. 이 정의는 망 조정 계산시 모든 관측치에 빠짐없이 적용함으로써 오차를 보정하게 됩니다.

[설치 오차] 탭의 액세스 방법:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집] 단추를 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[설치 오차] 탭을 선택합니다.

[GPS] 상자에 나오는 옵션:

안테나 높이 오차

안테나 높이의 추정 오차를 정의하는 필드입니다. 이 추정 오차는 망 조정 계산시 모든 GPS 관측치에 빠짐없이 적용됩니다.

안테나 높이 추정 오차는 측정 도구의 종류나 측정 독취 능력에 좌우됩니다. 안테나 높이를 측정할 때 금속 줄자로 하는 것이 높이 측정 막대를 이용할 때보다 그 추정 허용 오차가 약간 더 큽니다. 막대가 빳빳한 반면, 금속 줄자는 훨씬 신축적이기 때문입니다.

일반적으로 안테나 높이 오차의 범위는 0.000 m(0.000 sft) ~ 0.004 m(0.013 sft)입니다. 기본값은 0.000 m(0.000 sft)입니다.

센터링 오차

측량점상에서 안테나 연직 작업과 수준 작업을 할 때의 추정 오차를 정의하는 필드입니다.

센터링 오차는 망 조정 계산시 모든 GPS 관측치에 빠짐없이 적용됩니다. 이 오차는 Tribrach를 얼마나 잘 유지하느냐, 또는 측량점상에서 센터링을 얼마나 잘 하느냐에 따라 영향을 받습니다.

일반적으로 센터링 오차의 범위는 0.000 m(0.002 sft) ~ 0.002 m(0.007 sft)입니다. 기본값은 0.000 m(0.000 sft)입니다.

[비GPS] 상자에 나오는 옵션:

기계고 오차

기계고 오차는 기계고나 타겟 높이의 추정 오차로서 망 조정 계산시 모든 비GPS 관측치에 빠짐없이 적용됩니다.

이 추정 오차는 측정 도구의 종류나 측정 독취 능력에 좌우되는데 일반적으로 그 범위는 0.000 m(0.000 sft) ~ 0.004 m(0.013 sft)입니다. 기본값은 0.000 m(0.000 sft)입니다.

센터링 오차

측량점상에서 측량기/타겟 연직 작업과 수준 작업을 할 때의 추정 오차를 정의하는 필드입니다.

센터링 오차는 망 조정 계산시 모든 비GPS 관측치에 빠짐없이 적용됩니다 . 이 오차는 Tribrach를 얼마나 잘 유지하느냐, 또는 측량점상에서 Tribrach센터링을 얼마나 잘 하느냐에 따라 영향을 받습니다.

일반적으로 센터링 오차의 범위는 0.000 m(0.002 sft) ~ 0.002 m(0.007 sft)입니다. 기본값은 0.000 m(0.000 sft)입니다.


    [새 스타일] 대화 상자

추가 정보

방법 ...	대화 상자	기타
개요

새로운 망 조정 스타일을 만드는 대화 상자입니다.

이 대화 상자를 불러오려면:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	[새로 만들기]를 누릅니다. 이 새 스타일이 활성 스타일로 되면서 [새 스타일] 대화 상자가 나옵니다.

옵션:

이름

새로운 망 조정 스타일의 이름을 이 필드에 입력합니다. 이름은 최고 255 개 문자까지 쓸 수 있지만 짧은 이름일수록 스타일 목록에서 찾기가 싶습니다. 스타일의 이름을 붙이고 [확인] 단추를 눌러 [조정 스타일 편집] 대화 상자가 나오면 스타일 제어 옵션을 적절히 설정합니다.


    [스타일 복사] 대화 상자

추가 정보

방법 ...	대화 상자	기타
개요

다른 망 조정 스타일의 복사본을 토대로 하여 새로운 망 조정 스타일을 만드는 대화 상자입니다.

이 대화 상자를 불러오려면:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	복사하고자 하는 기존 스타일을 스타일 목록에서 선택합니다.

3.	[복사]를 누릅니다.

복사된 스타일이 활성 스타일로 되면서 [스타일 복사] 대화 상자가 나옵니다 .

옵션:

이름

이 필드에 새로운 망 조정 스타일의 이름을 입력하면, 스타일 목록에서 선택한 파일의 복사본이 이 이름으로 만들어집니다. 이름은 최고 255 개 문자까지 쓸 수 있지만 짧은 이름일수록 스타일 목록에서 찾기가 싶습니다. 스타일의 이름을 붙이고 [확인] 단추를 눌러 [조정 스타일 편집] 대화 상자가 나오면 조정 스타일의 제어 옵션을 적절히 설정할 수 있습니다.


    [스타일 이름 변경] 대화 상자

추가 정보

방법 ...	대화 상자	기타
개요

망 조정 스타일의 이름을 변경하는 대화 상자입니다.

이 대화 상자를 불러오려면:

1.	[조정 / 조정 스타일] 명령을 실행합니다. [망 조정 스타일] 대화 상자가 나옵니다.

2.	이름을 바꾸고자 하는 스타일을 스타일 목록에서 선택합니다.

3.	[이름 변경]을 누릅니다.

[스타일 이름 변경] 대화 상자가 나옵니다.

옵션:

이름

원래의 망 조정 스타일에 대하여 새 이름을 입력합니다. 이름은 최고 255 개 문자까지 쓸 수 있지만 짧고 서술적인 이름이 목록에서 찾기가 싶습니다.


[조정 스타일 편집] 대화 상자 - [비GPS 제어 옵션] 탭

추가 정보

 대화 상자

개요

이 조정 스타일을 이용하여 비GPS 추정 오차와 제어 옵션을 정의합니다. 나오는 열:

열	표시 내용
측정치	이용 가능한 비GPS 측정치   수평각   사거리   수직각   델타 표고   레벨 로드 독취값   지오이드 분리 간격   방위각
기본값 표준 오차	지정 표준 오차가 없을 때 쓰이는 표준 오차
절대 최소 표준 오차	절대 최소 표준 오차는 이 오차가 지정 표준 오차보다 클 때 적용됩니다.
비례 최소 표준 오차	비례 최소 표준 오차는 절대 오차 요소와 비례 오차 요소의 합이 지정 표준 오차보다 클 때 적용됩니다. 참조: 비례 오차는 사거리에서만 발생합니다.
다음 중 하나의 확인란을 선택하여 비GPS 관측치에 수행할 조정 방식을 정합니다.

 수직 조정 수행

 수평 조정 수행


변환 그룹 관측치 추가하기

 개요 및 추가 정보

언제라도 관측치를 사용자 정의 변환 그룹에 새로 추가할 수 있습니다. 또한 더 이상 필요하지 않은 관측치는 제거할 수도 있습니다.

팁: [필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러온 다음, [이용 가능 관측치] 목록에서 관측치 종류를 필터링 할 수 있습니다.

팁: 목록의 열은 다른 위치로 옮길 수 있습니다. 그 크기를 조절함으로써 표시 정보의 양을 늘리거나 줄일 수도 있고, 오름차순/내림차순으로의 정렬도 가능합니다.

관측치 추가 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

참조: 지오이드 기본값 변환 그룹은 수정할 수 없습니다.

3.	해당 변환 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다. 선택한 변환 그룹의 관측치들이 [그룹 관측치] 목록에 나옵니다.

5.	[이용 가능 관측치] 목록에서 관측치를 하나 선택합니다.

6.	[추가] 단추를 누르면 이 관측치가 [그룹 관측치] 목록에 추가됩니다.

7.	[확인] 단추를 눌러 변경 내용을 저장합니다.


분산 그룹 관측치 추가하기

 개요 및 추가 정보

언제라도 관측치를 분산 그룹에 추가할 수 있습니다. 또한 더 이상 필요하지 않은 관측치는 제거할 수도 있습니다.

팁: [필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러온 다음, [이용 가능 관측치] 목록에서 관측치 종류를 필터링 할 수 있습니다.

팁: 목록의 열은 다른 위치로 옮길 수 있습니다. 그 크기를 조절함으로써 표시 정보의 양을 늘리거나 줄일 수도 있고, 오름차순/내림차순으로의 정렬도 가능합니다.

관측치 추가 방법:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

참조: 지오이드 기본값 분산 그룹은 수정할 수 없습니다.

3.	원하는 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [분산 그룹 편집] 대화 상자가 나옵니다. 선택한 그룹의 관측치들이 [그룹 관측치] 목록에 나오고, 이용 상태인 프로젝트 관측치는 모두 [이용 가능 관측치] 목록에 나옵니다.

5.	이 그룹에 추가하고자 하는 관측치를 [이용 가능 관측치] 목록에서 클릭합니다.

6.	[추가] 단추를 누르면 이 관측치가 [이용 가능 관측치] 상자에서 없어지고 [그룹 관측치] 목록에 추가됩니다.

7.	[확인] 단추를 눌러 변경 내용을 저장합니다.


가중 전략 적용하기

 개요 및 추가 정보

가중 전략은 차회의 조정 반복 연산에 적용할 수 있습니다.

가중 전략 적용 방법:

1.	[조정 / 가중 전략] 명령을 실행하면 [가중 전략] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	가중 전략을 편집합니다.

4.	[적용] 단추를 누르면 새 가중 전략이 그 다음의 조정 반복 연산에 적용됩니다.

5.	[확인] 단추를 눌러 이 대화 상자를 닫습니다.


변환 매개 변수 값 변경하기

 개요 및 추가 정보

주의: 변환 매개 변수 값의 필드를 변경할 때에는 아주 세심한 주의를 기울이도록 합니다. 변경 작업에 앞서 망 조정 이론과 최소 자승 조정법에 대하여 완전히 이해할 필요가 있습니다.

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다. 이 필드들은 편집 가능한 GPS 및 비GPS 관측치입니다.

매개 변수 값 변경 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	원하는 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

5.	해당 변환 매개 변수의 [값] 필드를 선택합니다.

6.	새 매개 변수 값을 입력합니다.

고려할 지침 사항:

  각도 값은 부호가 있는 DDD.MMSSssss 형식으로 입력합니다.

  선형 값은 부호가 있는 프로젝트 단위로 입력합니다.

개별 변환 매개 변수에 대한 값과 상태의 변경 지침은 다음 항목을 참조합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

7.	[상태] 필드에서 '사용자 정의' 옵션을 선택합니다. 자세한 내용은 상기 항목을 참조하십시오.

8.	필요한 경우, 1에서 7까지의 단계를 반복함으로써 다른 매개 변수 값도 변경합니다. 원하는 변환 작업을 하기 위해서는 여러 매개 변수의 [값] 필드와 [상태] 필드를 변경하여야 할 수 있습니다.

9.	[확인] 단추를 누릅니다.

변경 내용이 해당 변환 그룹에 적용됩니다.


포인트의 고정 상태를 해제하여 좌표 구성 요소 제약을 제거하기

개별 포인트를 포인트 목록의 좌표 구성 요소에 제약하고자 쓴 고정 상태 설정은 선택적으로 해제할 수 있습니다.

고정 상태 설정의 해제 방법:

1.	[조정 / 포인트] 명령을 실행하여 [포인트] 대화 상자를 불러옵니다.

2.	스크롤 바를 이용하여 원하는 포인트를 찾습니다.

3.	그 포인트를 선택합니다.

4.	[고정] 옵션 상자에서 해당 확인란의 선택을 해제함으로써 그 구성 요소 제약을 제거합니다.

[확인] 단추를 눌러 변경 내용을 프로젝트에 적용합니다


망 조정 스타일 복사하기

기존 스타일을 복사함으로써 새 스타일을 만들 수 있습니다. 새 스타일의 망 조정 설정은 원본 스타일의 그것과 똑같게 되지만 일단 스타일을 복사한 다음, 그 조정 설정을 알맞게 바꾸면 됩니다.

스타일 복사 방법:

1.	[조정 / 조정 스타일] 명령을 실행하여 [망 조정 스타일] 대화 상자를 불러옵니다.

2.	[복사] 단추를 누르면 [스타일 복사] 대화 상자가 나옵니다.

3.	[이름] 필드에 새 스타일의 이름을 쳐넣습니다.

4.	[확인] 단추를 눌러 [조정 스타일 편집] 대화 상자를 불러옵니다.

5.	스타일 설정을 편집합니다.

6.	[확인] 단추를 눌러 새 스타일을 저장합니다.


망 조정 스타일 만들기

새 조정 스타일을 만드는 방식은 2가지입니다. 여기에서는 '95% 신뢰도 한계' 스타일의 설정을 토대로 새 스타일을 만드는 방법을 설명합니다. 또 다른 한 방법은 기존 스타일의 설정을 새 스타일로 복사하는 것입니다.

팁: 새 스타일은 편집을 함으로써 사용자의 필요에 맞게 그 조정 설정을 바꿀 수 있습니다.

새 스타일을 만드는 방법:

1.	[조정 / 조정 스타일] 명령을 실행하면 [망 조정 스타일 대화 상자가 나옵니다.

2.	[새로 만들기] 단추를 눌러 [새 스타일] 대화 상자를 불러옵니다.

3.	[이름] 필드에 새 스타일의 이름을 입력합니다. 스타일 이름은 최고 255 개 문자까지 쓸 수 있지만 짧은 이름일수록 스타일 목록에서 찾기가 쉽습니다.

4.	[확인] 단추를 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

5.	다음 중 하나의 탭을 선택합니다.

  일반

  공분산 표시

  비GPS 제어 옵션

  설치 오차

6.	스타일 제어 옵션을 적절히 설정합니다.

7.	[확인] 단추를 눌러 새 스타일을 저장합니다.


변환 그룹 만들기

 개요 및 추가 정보

하나의 망 조정에 대하여 하나 또는 그 이상의 변환 그룹을 만들 수 있습니다. 일단 만들어진 그룹은 [그룹] 목록에 추가됩니다.

참조: GPS 관측치나 비GPS 관측치의 변환 그룹만 새로 만들 수 있습니다. 지오이드 변환 그룹은 새로 만들지 못합니다.

새 그룹을 만드는 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하여 [변환 그룹] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	[새로 만들기] 단추를 누르면 [새 변환 그룹] 대화 상자가 나옵니다.

4.	새 변환 그룹의 이름을 [이름] 필드에 쳐넣습니다.

5.	[확인] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

6.	관측치를 [이용 가능 관측치] 목록으로부터 [그룹 관측치] 목록으로 추가합니다 .

7.	그룹에 대한 변환 매개 변수를 직접 정의하거나, 아니면 소프트웨어상에서 계산이 되도록 설정합니다.

팁: 목록의 필터링을 하면 관측치 종류를 일시적으로 숨기고 그 목록의 크기를 줄일 수 있습니다. 목록의 크기가 작을수록 관측치를 찾기 용이합니다.

관측치 필터링 방법:

1.	[필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러옵니다. 처음에는 관측치 종류별 확인란이 전부 선택되어 있으므로 모든 관측치가 [이용 가능 관측치] 목록에 표시됩니다.

2.	숨기고자 하는 관측치 종류의 확인란을 모두 선택 해제합니다. 필터링 작업은 현재의 편집 세션에만 영향을 미치므로 일단 대화 상자를 닫으면 그 필터들이 원래 값으로 재설정됩니다.

관측치 추가 방법:

1.	[이용 가능 관측치] 목록에서 관측치를 선택합니다. [추가] 단추가 활성화됩니다.

참조: [변환] 필드는 이미 관측치와 관련되어 있는 변환 그룹을 표시하므로 관측치 추가 도중 이 필드를 지침으로 하여 처리하도록 합니다. 각각의 관측치는 <GPS 기본값>이나 <비GPS 기본값>을 제외하고 단 하나의 변환 그룹에만 지정할 수 있습니다. 하지만 어떤 그룹의 관측치들을 선택한 후, [추가] 단추를 누르면 이들을 활성 그룹에 전송할 수 있습니다. 모든 GPS 관측치는 다른 변환 그룹에 추가되는 경우에도 <GPS 기본값>에 계속 지정되어 있게 됩니다. 마찬가지로 모든 비GPS 관측치도 다른 변환 그룹에 추가되더라도 <비GPS 기본값>에 계속 지정되어 있게 됩니다.

2.	[추가] 단추를 누릅니다.

해당 관측치가 [그룹 관측치] 목록에 추가됩니다.

관측치 제거 방법:

1.	[그룹 관측치] 목록에서 관측치를 선택합니다. [제거] 단추가 활성화됩니다.

2.	[제거] 단추를 누릅니다.

해당 관측치가 [그룹 관측치] 목록에서 제거됩니다.

참조: 제거된 관측치의 상태는 [이용 가능 관측치] 목록에서 바뀝니다. 이제 이 관측치는 그 [변환] 필드가 해제됨으로써 다른 변환 그룹에 추가될 수 있게 됩니다.

참조: 관측치를 <GPS 기본값>이나 <비GPS 기본값>, <지오이드 기본값> 변환 그룹에서 제거하지 못합니다.

변환 매개 변수 정의 방법:

주의: 변환 매개 변수의 값과 상태를 변경할 때에는 아주 세심한 주의를 기울이도록 합니다. 변경 작업에 앞서 망 조정 이론과 최소 자승 조정법에 대하여 완전히 이해할 필요가 있습니다. 망 조정 이론과 최소 자승 조정법에 대한 참고 자료의 목록은 참고 문헌을 참조하십시오.

1.	원하는 매개 변수의 [값] 필드를 선택합니다.

2.	다음 각 항목에 수록된 지침을 참조하여 이 필드를 편집합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다.

3.	[상태] 필드에서 적당한 옵션을 선택합니다. 자세한 사항은 상기 항목을 참조하십시오.

4.	[확인] 단추를 눌러 변경 내용을 저장합니다.


분산 그룹 만들기

분산 그룹은 조정 작업간 아무 때나 새로 만들 수 있습니다.

참조: GPS 관측치나 비GPS 관측치의 분산 그룹만 새로 만들 수 있습니다. 지오이드 분산 그룹은 새로 만들지 못합니다.

분산 그룹을 만드는 방법:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	[새로 만들기] 단추를 눌러 분산 그룹을 만듭니다. [새 분산 그룹] 대화 상자가 나옵니다.

4.	새 그룹의 이름을 입력합니다.

5.	[확인] 단추를 누르면 [분산 그룹 편집] 대화 상자가 나옵니다. [이용 가능 관측치] 목록은 새 그룹에 추가할 관측치의 선택에 이용합니다.

6.	원하는 관측치를 선택합니다.

팁: [필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러온 다음, [이용 가능 관측치] 목록에서 관측치 종류를 필터링 할 수 있습니다.

7.	[추가] 단추를 누릅니다.

8.	그룹 만들기가 완료될 때까지 1에서 7까지의 단계를 반복합니다.

9.	[확인] 단추를 눌러 변경 내용을 프로젝트에 저장합니다.


변환 매개 변수 정의하기

 개요 및 추가 정보

주의: 변환 매개 변수 값의 필드를 변경할 때에는 아주 세심한 주의를 기울이도록 합니다. 변경 작업에 앞서 망 조정 이론과 최소 자승 조정법에 대하여 완전히 이해할 필요가 있습니다.

매개 변수 값 변경 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	원하는 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

5.	해당 변환 매개 변수의 [값] 필드를 선택합니다.

6.	새 매개 변수 값을 입력합니다.

고려할 지침 사항:

  각도 값은 부호가 있는 DDD.MMSSssss 형식으로 입력합니다.

  선형 값은 부호가 있는 프로젝트 단위로 입력합니다.

개별 변환 매개 변수에 대한 값과 상태의 변경 지침은 다음 항목을 참조합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다.

7.	목록에서 변환 매개 변수 상태를 선택합니다. 자세한 내용은 상기 항목을 참조하십시오.

8.	필요한 경우, 2에서 7까지의 단계를 반복함으로써 다른 매개 변수 값도 변경합니다. 원하는 변환 작업을 하기 위해서는 여러 매개 변수의 [값] 필드와 [상태] 필드를 변경하여야 할 수 있습니다.

9.	[확인] 단추를 누릅니다.

변경 내용이 해당 변환 그룹에 적용됩니다.


변환 그룹 삭제하기

 개요 및 추가 정보

사용자 정의 변환 그룹은 더 이상 필요하지 않다면 삭제할 수 있습니다. 삭제한 그룹은 해당 프로젝트에서 제거되므로 더 이상 이용하지 못합니다.

참조: <GPS 기본값>과 <비GPS 기본값>, <지오이드 기본값> 변환 그룹은 삭제할 수 없습니다. 따라서 이 기본값 그룹 이외의 다른 그룹이 없을 경우에는 [삭제] 단추가 자동으로 기능 해제됩니다.

그룹 삭제 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	해당 그룹을 선택합니다.

4.	[삭제] 단추를 누르면 확인 메시지가 나옵니다.

5.	[확인] 단추를 누릅니다.


분산 그룹 삭제하기

 개요 및 추가 정보

분산 그룹은 더 이상 필요하지 않다면 삭제할 수 있습니다. 삭제한 그룹은 해당 프로젝트에서 제거되므로 더 이상 이용하지 못합니다.

참조: <GPS 기본값>과 <비GPS 기본값>, <지오이드 기본값> 분산 그룹은 삭제할 수 없습니다. 따라서 이 기본값 그룹 이외의 다른 그룹이 없을 경우에는 [삭제] 단추가 자동으로 기능 해제됩니다.

그룹 삭제 방법:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	원하는 그룹을 선택합니다.

4.	[삭제] 단추를 누르면 확인 메시지가 나옵니다.

5.	[확인] 단추를 누릅니다.


망 조정 스타일 삭제하기

망 조정 스타일은 더 이상 필요하지 않다면 삭제할 수 있습니다. 삭제한 스타일은 해당 프로젝트에서 제거되므로 더 이상 이용하지 못합니다.

참조: 스타일 목록에는 최소한 1개 이상의 스타일이 있어야 합니다. 목록에 스타일이 하나밖에 없을 경우에는 [삭제] 단추가 자동으로 기능 해제됩니다. 마지막 스타일을 삭제하고 이를 다른 것으로써 대체하고자 하면 [새로 만들기] 단추를 눌러 새 스타일을 하나 만듭니다. 새 스타일은 '95% 신뢰도 한계' 스타일을 바탕으로 합니다. 자세한 내용은 망 조정 스타일 만들기를 참조하십시오.

스타일 삭제 방법:

1.	[조정 / 조정 스타일] 명령을 실행하여 [망 조정 스타일] 대화 상자를 불러옵니다.

2.	삭제하고자 하는 스타일을 스타일 목록에서 선택합니다.

3.	[삭제] 단추를 누르면 확인 메시지가 나옵니다.

4.	[확인] 단추를 누릅니다.


관측치를 조정과 재계산에서 이용 해제하기

 개요 및 추가 정보

망 조정이나 재계산에서 불이용하고자 하는 관측치는 이용 해제할 수 있습니다. 이용 해제한 관측치는 [관측치] 대화 상자에서 제거되지만 그 데이터가 프로젝트에서 영구 삭제되지는 않습니다.

관측치를 이용 해제하는 방법은 2가지입니다.

[관측치] 대화 상자에서 이용 해제하는 방법:

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	스크롤 바를 이용하여 원하는 관측치를 찾습니다.

팁: [이용 가능 관측치] 목록의 관측치를 필터링 하여 특정 종류의 관측치를 숨기거나 표시하면 관측치를 찾기가 더 쉬워집니다.

4.	해당 관측치에 마우스의 오른쪽 단추를 눌러 나오는 바로 가기 메뉴에서 [불이용]을 선택합니다. 이 관측치가 목록에서 사라지고 망 조정과 재계산에 더 이상 쓰이지 않게 됩니다.

이용 해제된 관측치는 그래픽 창에서 빨간색으로 됩니다.

5.	[확인] 단추를 눌러 변경 내용을 프로젝트에 저장합니다.

그래픽 창에서 이용 해제하는 방법:

1.	이용 해제하고자 하는 관측치를 더블 클릭합니다. 등록 정보 창이 나옵니다.

2.	요약 페이지 [image] 메뉴 단추를 누르면 요약 페이지가 나옵니다.

3.	[상태] 목록에서 '불이용'을 선택합니다.

이용 해제된 관측치를 재이용하고자 하면 그래픽 창에서 그 관측치의 등록 정보를 편집하여야 합니다.

참조: 관측치의 이용 해제는 관측치 제외하기와는 다릅니다. 제외된 관측치는 이용 해제된 관측치와 마찬가지로 망 조정이나 재계산에 쓰이지는 않지만 여전히 [관측치] 목록에 나옵니다. 또한 그 데이터가 프로젝트에서 영구 삭제되지 않으므로 제외된 관측치를 다시 이용할 수 있습니다.


공분산 표시 조정 스타일 옵션 편집하기

 개요 및 추가 정보

공분산 표시 설정은 조정 작업간 아무 때나 편집할 수 있습니다.

공분산 표시 설정의 편집 방법:

1.	[조정 / 조정 스타일] 명령을 실행하면 [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집]을 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[공분산 표시] 탭 하에서 필요한 대로 다음 옵션을 편집합니다.

  수평

  3차원

5.	옵션 편집이 끝나면 [확인] 단추를 눌러 변경 내용을 이 조정 스타일에 적용합니다.


일반 조정 스타일 옵션 편집하기

일반 옵션은 조정 작업간 아무 때나 편집할 수 있습니다.

일반 설정의 편집 방법:

1.	[조정 / 조정 스타일] 명령을 실행하면 [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집]을 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[일반] 탭 하에서 다음의 확인란을 선택하거나 선택 해제합니다.

  Reduced Column Profile 이용

  공변항을 관측선에 한정

  지오이드 모델의 상관도 계산

5.	'잔차 허용 범위' 옵션을 편집합니다.

6.	'시그마 스칼라' 옵션을 편집합니다.

7.	[최대 반복 연산 수] 필드에 새 값을 입력합니다.

8.	[확인] 단추를 눌러 변경 내용을 저장합니다.


비GPS 제어 스타일 옵션 편집하기

 개요 및 추가 정보

조정 작업간 아무 때나 비GPS 제어 옵션을 편집할 수 있습니다.

방법:

1.	[조정 / 조정 스타일] 명령을 실행하면 [망 조정 스타일] 대화 상자가 나옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집]을 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[비GPS 제어 옵션] 탭 하에서 관련 측정치의 표준 오차 값을 편집합니다.

5.	[수직 조정 수행] 확인란을 선택하거나 선택 해제합니다. 이 옵션은 3D 트래버스나 레벨 데이터의 조정시 선택합니다.

6.	[수평 조정 수행] 확인란을 선택하거나 선택 해제합니다. 이 옵션은 2D 트래버스의 조정시 선택합니다.

7.	[확인] 단추를 눌러 변경 내용을 저장합니다.


변환 그룹 편집하기

 개요 및 추가 정보

GPS 변환 그룹이나 비GPS 변환 그룹의 편집시에 가능한 작업으로는 관측치를 그룹에 추가하거나 그룹에서 제거하고 변환 매개 변수를 정의하는 등 여러 가지가 있습니다. 지오이드 변환 그룹의 경우, 그 편집 작업은 변환 매개 변수의 정의에 국한됩니다.

GPS 변환 그룹이나 비GPS 변환 그룹, 지오이드 변환 그룹의 편집 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	해당 변환 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

5.	관측치를 추가 또는 제거합니다(아래 참조). (GPS나 비GPS 만)

6.	변환 매개 변수를 정의하거나(아래 참조), 아니면 소프트웨어상에서 계산이 되도록 설정합니다. (GPS나 비GPS, 지오이드)

GPS 변환 그룹의 관측치를 필터링 하는 방법:

1.	[필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러옵니다. 처음에는 관측치 종류별 확인란이 전부 선택되어 있으므로 모든 관측치가 [이용 가능 관측치] 목록에 표시됩니다.

2.	필터링 작업은 현재의 편집 세션에만 영향을 미치므로 일단 대화 상자를 닫으면 그 필터들이 원래 값으로 재설정됩니다.

GPS 관측치나 비GPS 관측치의 추가 방법:

1.	[이용 가능 관측치] 목록에서 관측치를 선택합니다. 그 관측치가 하이라이트되고 [추가] 단추가 활성화됩니다.

참조: [이용 가능 관측치] 목록의 [변환] 필드는 이미 관측치와 관련되어 있는 변환 그룹을 표시하므로 관측치 추가 도중 이 필드를 지침으로 하여 처리하도록 합니다. 각각의 관측치는 단 하나의 변환 그룹에만 지정할 수 있습니다.

2.	[추가] 단추를 누릅니다. 해당 관측치가 [그룹 관측치] 목록에 추가됩니다.

GPS 관측치나 비GPS 관측치의 제거 방법:

1.	[그룹 관측치] 목록에서 관측치를 선택합니다. 그 관측치가 하이라이트되고 [제거] 단추가 활성화됩니다.

2.	[제거] 단추를 누릅니다. 해당 관측치가 [그룹 관측치] 목록에서 제거됩니다.

참조: 관측치를 <GPS 기본값>이나 <비GPS 기본값>, <지오이드 기본값> 변환 그룹에서 제거하지 못합니다.

참조: 제거된 관측치의 상태는 [이용 가능 관측치] 목록에서 바뀝니다. 이 관측치는 그 [변환] 필드가 해제됨으로써 이제 다른 변환 그룹에 추가될 수 있게 됩니다.

변환 그룹(GPS 나 비GPS, 지오이드)에 대한 변환 매개 변수의 정의 방법:

주의: 변환 매개 변수의 값과 상태를 변경할 때에는 아주 세심한 주의를 기울이도록 합니다. 변경 작업에 앞서 망 조정 이론과 최소 자승 조정법에 대하여 완전히 이해할 필요가 있습니다. 망 조정 이론과 최소 자승 조정법에 대한 참고 자료의 목록은 참고 문헌을 참조하십시오.

1.	원하는 매개 변수의 [값] 필드를 선택합니다.

2.	다음 각 항목에 수록된 지침을 참조하여 이 필드를 편집합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다.

3.	[상태] 필드에서 적당한 옵션을 선택합니다. 자세한 사항은 상기 항목을 참조하십시오.

4.	[확인] 단추를 눌러 변경 내용을 프로젝트에 저장합니다.


분산 그룹 편집하기

 개요 및 추가 정보

분산 그룹은 조정 작업간 아무 때나 편집할 수 있습니다.

참조: 기본값 지오이드 변환 그룹에 대한 [편집] 단추로는 그 그룹을 볼 수만 있습니다.

그룹 편집 방법:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	원하는 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [분산 그룹 편집] 대화 상자가 나옵니다. 해당 그룹의 관측치들이 [그룹 관측치] 목록에 나오고, 이용 상태인 망 조정 관측치는 모두 [이용 가능 관측치] 목록에 나옵니다.

관측치 추가 방법:

1.	[이용 가능 관측치] 목록에서 관측치를 하나 선택합니다. 그 관측치가 하이라이트되고 [추가] 단추가 활성화됩니다.

2.	[추가] 단추를 누릅니다.

이 관측치가 [이용 가능 관측치] 상자에서 없어지고 [그룹 관측치] 목록에 추가됩니다.

관측치 제거 방법:

1.	제거하려는 관측치를 [그룹 관측치] 목록에서 선택합니다. 그 관측치가 하이라이트되고 [제거] 단추가 활성화됩니다.

2.	[제거] 단추를 누릅니다.

해당 관측치가 이 그룹에서 제거되고 [이용 가능 관측치] 목록에 들어옵니다.

관측치 저장 방법:

  [확인] 단추를 누릅니다.

변경 내용이 프로젝트에 저장됩니다.


[포인트] 목록에서 좌표 편집하기

 개요 및 추가 정보

 [포인트] 목록에 있는 포인트의 좌표를 조정 과정에서 편집할 수 있습니다.

1.	[조정 / 포인트] 명령을 실행하여 [포인트] 대화 상자를 불러옵니다.

2.	스크롤 바를 이용하여 편집할 포인트를 찾습니다.

3.	편집할 좌표 구성 요소를 선택합니다.

4.	어떤 좌표 구성 요소의 편집시, 그 구성 요소의 확인란이 자동 선택됩니다([고정] 상자에서).

5.	[고정] 상자에서 어떤 구성 요소를 선택 해제하면 그 좌표 구성 요소는 편집 전의 원래 저장 값으로 되돌아갑니다.

6.	편집할 다른 포인트에 대해서도 앞의 과정을 반복합니다.

7.	편집 작업이 완료되면 [확인] 단추를 누릅니다.

선택한 좌표 보기(즉, WGS-84나 그리드, 로컬) 형식으로 변경 내용이 프로젝트에 저장됩니다.


가중 전략 편집하기

 개요 및 추가 정보

조정 작업간 아무 때나 가중 전략을 정의, 적용할 수 있습니다.

가중 전략 편집 방법:

1.	[조정 / 가중 전략] 명령을 실행하면 [가중 전략] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다. 관측치 목록(GPS, 비GPS, 지오이드)이 나옵니다.

3.	스칼라 적용 대상 옵션을 '모든 관측치'나 '각 관측치', 분산 그룹'으로 설정합니다.

참조: 지오이드 변환 그룹에 대해서는 '모든 관측치' 옵션만 가능합니다.

4.	다음 중 하나를 택합니다.

  제 3단계에서 '모든 관측치'나 '각 관측치'를 선택하였다면 제 6단계로 바로 갑니다.

  제 3단계에서 '분산 그룹'을 선택하였다면 제 5단계 작업을 수행합니다.

참조: [각 관측치] 단추를 선택하는 경우에는 '사용자 정의' 스칼라 형을 이용하지 못합니다.

5.	제 3단계에서 '분산 그룹'을 선택하였다면 [관측치] 목록이 [그룹] 목록으로 바뀌고 모든 분산 그룹이 표시됩니다. 다음을 수행합니다.

1)	스칼라 형을 '기본값'이나 '대체', '사용자 정의', '자동'으로 설정합니다.

2)	다음 중 하나를 택합니다.

  '기본값'이나 '대체', '자동'을 선택한 경우, 제 8단계로 갑니다.

  '사용자 정의'를 선택한 경우, 커서가 [그룹] 목록의 [스칼라 값] 필드에 나오므로 스칼라 값을 입력할 수 있습니다.

3)	스칼라 값을 입력한 다음, 제 8단계로 갑니다.

6.	스칼라 형을 '기본값'이나 '대체', '사용자 정의', '자동'으로 설정합니다.

7.	다음 중 하나를 택합니다.

  '기본값'이나 '대체', '자동'을 선택한 경우, 제 8단계로 갑니다.

  '사용자 정의'를 선택한 경우, [스칼라 값] 필드가 활성화되므로 원하는 값을 입력할 수 있습니다. 값을 입력한 다음, 다음 단계로 진행해 갑니다.

8.	[확인] 단추나 [적용] 단추를 누릅니다.

변경 내용이 저장됩니다.


설치 오차 조정 스타일 옵션 편집하기

 개요 및 추가 정보

설치 오차 옵션은 조정 작업간 아무 때나 편집할 수 있습니다.

설치 오차 옵션의 편집 방법:

1.	[조정 / 조정 스타일] 명령을 실행하여 [망 조정 스타일] 대화 상자를 불러옵니다.

2.	스타일 목록에서 스타일을 하나 선택합니다.

3.	[편집]을 누르면 [조정 스타일 편집] 대화 상자가 나옵니다.

4.	[설치 오차] 탭을 선택하면 설치 오차 옵션이 나옵니다. 필요한 경우, 다음을 실행합니다.

1)	[안테나 높이 오차] 필드나 [기계고 오차] 필드에 새 값을 입력합니다.

2)	[센터링 오차] 필드에 새 값을 입력합니다.

5.	변경을 하고 난 다음, [확인] 단추를 누릅니다.

변경 내용이 저장됩니다.


조정에 관측치 포함시키기

 개요 및 추가 정보

이전에 망 조정으로부터 제외한 관측치를 다시 포함시킬 수 있습니다.

방법:

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다. [관측치] 목록이 나옵니다.

3.	스크롤 바를 이용하여 해당 관측치를 찾습니다.

4.	[사용] 열의 확인란을 선택함으로써 관측치를 망 조정에 포함시킵니다.

팁: Shift 키나 Ctrl 키를 써서 여러 관측치를 선택할 수 있습니다.

5.	[확인] 단추를 누릅니다.

변경 내용이 프로젝트에 저장됩니다.

참조: 조정으로부터 관측치를 제외시키는 것과 관련, 자세한 내용은 관측치 제외하기를 참조하십시오.

참조: 관측치를 이용 해제하거나 재이용할 수도 있습니다. 자세한 사항은 관측치 이용 해제하기와 이용 해제된 관측치의 재이용을 참조하십시오.

참조: 등록 정보 창을 이용하여 관측치를 조정에 포함시킬 수도 있습니다. 요약 페이지에서 [망 조정에 이용] 확인란을 선택하면 됩니다.


망 조정 보고서 검토하기

 개요 및 추가 정보

조정 횟수가 거듭됨에 따라 그 결과가 망 조정 보고서에 나옵니다. 이 결과를 토대로 해서 망을 점진적으로 수렴시키기 위한 제반 작업을 하게 됩니다. 즉, 조정 스타일을 변경하거나 관측치의 포함/제외, 관측치의 이용/이용 해제, 지오이드 분리 간격의 로드, 변환 그룹을 만들어 관측치의 그룹에 변환 적용하기, 분산 그룹 만들기, 가중 전략 적용하기, 기준점을 좌표 구성 요소에 제약하기 등등의 작업을 수행합니다.

보고서 검토 방법:

1.	[보고서 / 망 조정 보고서] 명령을 실행합니다. 보고서가 만들어지고 사용자의 기본 HTML 뷰어가 뜨므로 이를 통하여 보고서를 봅니다.

2.	필요한 통계를 보고서에서 찾아 검토함으로써 망 조정 결과를 평가합니다.

아래 항목들에는 보고서 통계 평가의 일반 지침이 설명되어 있습니다. 보다 전문적인 지식은 참고 문헌을 참조하십시오.

  조정 스타일 설정

  잔차 허용 범위

  공분산 표시

  비GPS 제어 옵션

  설치 오차

  통계 요약

  반복 연산 수

  종합 통계

  GPS 관측치 통계

  지오이드 모델 통계

  비GPS 관측치 통계

  가중 전략

  조정된 좌표

  그리드 좌표

  측지 좌표

  좌표 델타

  기준 좌표 비교

  조정된 관측치

  GPS 관측치

  지오이드 관측치

  비GPS 관측치

  표준 잔차의 히스토그램

  포인트 오차 타원

  공변항


관측치 필터링 하기

 개요 및 추가 정보

필터링은 많은 양의 GPS 관측치나 비GPS 관측치 종류를 볼 때 유용하게 쓰입니다. [관측치] 대화 상자가 열려 있을 때 일시적으로 관측치들을 필터링 할 수 있는데, 선택한 관측치 종류가 숨겨지므로 목록의 크기가 작아집니다. [관측치] 목록의 필터링을 하는 경우, �필터링 되었음�이라는 말이 이 대화 상자의 제목에 나옵니다. 필터링된 관측치들은 대화 상자를 종료하는 즉시 해제됩니다.

필터링 방법:

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택하면 [관측치] 목록이 나옵니다.

3.	[필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러옵니다.

4.	필요한 확인란을 선택하거나 선택 해제합니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

비GPS 관측치 필터의 경우, 선택하고자 하는 종류의 관측치에 대하여 확신을 하지 못하는 한, 관측치의 모두를 선택 상태 그대로 두도록 합니다. 하나의 옵션을 선택하면 부분적인 관측치를 선택하는 것과 동일합니다. 예를 들어, 타원체 거리 필터를 선택하면 타원체 거리가 포함된 관측치만 보게 됩니다. 다시 말해, 수평각과 타원체 거리가 같이 있는 관측치는 이 두 필터 옵션을 동시에 선택하지 않는 한, 얻지 못하게 됩니다.

  [방위각] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 키입력된 방위각이 있는 관측치만 표시되게 됩니다.

  [델타 표고] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 레벨 데이터가 선택되게 됩니다.

  원시 관측치를 보고자 하면 [수평각], [타원체 거리], [삼각 표고] 확인란을 선택합니다.

5.	[확인] 단추를 누릅니다. 선택한 관측치 종류가 보이지 않게 되지만 망 조정에는 여전히 쓰입니다.


스칼라 가중 관측치 필터링 하기

 개요 및 추가 정보

필터링은 많은 양의 다양한 GPS 관측치나 비GPS 관측치를 볼 때 유용하게 쓰입니다. 대화 상자가 열려 있을 때 일시적으로 관측치들을 필터링 할 수 있는데, 선택한 관측치 종류가 숨겨지므로 목록의 크기가 작아집니다. [관측치] 목록의 필터링을 하는 경우, �필터링 되었음�이라는 말이 이 대화 상자의 제목에 나옵니다. 필터링된 관측치들은 대화 상자를 종료하는 즉시 해제됩니다.

필터링 방법:

1.	[조정 / 가중 전략] 명령을 실행하여 [가중 전략] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택하면 [관측치] 목록이 나옵니다.

3.	[필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러옵니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

4.	필요한 확인란을 선택하거나 선택 해제합니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

비GPS 관측치 필터의 경우, 선택하고자 하는 종류의 관측치에 대하여 확신을 하지 못하는 한, 관측치의 모두를 선택 상태 그대로 두도록 합니다. 하나의 옵션을 선택하면 부분적인 관측치를 선택하는 것과 동일합니다. 예를 들어, 타원체 거리 필터를 선택하면 타원체 거리가 포함된 관측치만 보게 됩니다. 다시 말해, 수평각과 타원체 거리가 같이 있는 관측치는 이 두 필터 옵션을 동시에 선택하지 않는 한, 얻지 못하게 됩니다.

  [방위각] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 키입력된 방위각이 있는 관측치만 표시되게 됩니다.

  [델타 표고] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 레벨 데이터가 선택되게 됩니다.

  원시 관측치를 보고자 하면 [수평각], [타원체 거리], [삼각 표고] 확인란을 선택합니다.

5.	[확인] 단추를 누릅니다. 선택한 관측치 종류가 보이지 않게 되지만 망 조정에는 여전히 쓰입니다.


변환 그룹 관측치 필터링 하기

 개요 및 추가 정보

필터링은 많은 양의 다양한 GPS 관측치나 비GPS 관측치를 볼 때 유용하게 쓰입니다. 대화 상자가 열려 있을 때 일시적으로 관측치들을 필터링 할 수 있는데, 선택한 관측치 종류가 숨겨지므로 목록의 크기가 작아집니다. [관측치] 목록의 필터링을 하는 경우, �필터링 되었음�이라는 말이 이 대화 상자의 제목에 나옵니다. 필터링된 관측치들은 대화 상자를 종료하는 즉시 해제됩니다.

필터링 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하여 [변환 그룹] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택하면 [이용 가능 관측치] 목록이 나옵니다.

3.	[필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러옵니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

4.	필요한 확인란을 선택하거나 선택 해제합니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

비GPS 관측치 필터의 경우, 선택하고자 하는 종류의 관측치에 대하여 확신을 하지 못하는 한, 관측치의 모두를 선택 상태 그대로 두도록 합니다. 하나의 옵션을 선택하면 부분적인 관측치를 선택하는 것과 동일합니다. 예를 들어, 타원체 거리 필터를 선택하면 타원체 거리가 포함된 관측치만 보게 됩니다. 다시 말해, 수평각과 타원체 거리가 같이 있는 관측치는 이 두 필터 옵션을 동시에 선택하지 않는 한, 얻지 못하게 됩니다.

  [방위각] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 키입력된 방위각이 있는 관측치만 표시되게 됩니다.

  [델타 표고] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 레벨 데이터가 선택되게 됩니다.

  원시 관측치를 보고자 하면 [수평각], [타원체 거리], [삼각 표고] 확인란을 선택합니다.

5.	[확인] 단추를 누릅니다.

선택한 관측치 종류가 보이지 않게 되지만 망 조정에는 여전히 쓰입니다.


분산 그룹 관측치 필터링 하기

 개요 및 추가 정보

필터링은 많은 양의 다양한 GPS 관측치를 볼 때 유용하게 쓰입니다. 대화 상자가 열려 있을 때 일시적으로 관측치들을 필터링 할 수 있는데, 선택한 관측치 종류가 숨겨지므로 목록의 크기가 작아집니다. [관측치] 목록의 필터링을 하는 경우, �필터링 되었음�이라는 말이 이 대화 상자의 제목에 나옵니다. 필터링된 관측치들은 대화 상자를 종료하는 즉시 해제됩니다.

필터링 방법:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하여 [분산 그룹] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택하면 [이용 가능 관측치] 목록이 나옵니다.

3.	[필터] 단추를 눌러 [관측치 필터] 대화 상자를 불러옵니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

4.	필요한 확인란을 선택하거나 선택 해제합니다. 기본값으로, 모든 필터의 확인란이 선택되어 있습니다.

비GPS 관측치 필터의 경우, 선택하고자 하는 종류의 관측치에 대하여 확신을 하지 못하는 한, 관측치의 모두를 선택 상태 그대로 두도록 합니다. 하나의 옵션을 선택하면 부분적인 관측치를 선택하는 것과 동일합니다. 예를 들어, 타원체 거리 필터를 선택하면 타원체 거리가 포함된 관측치만 보게 됩니다. 다시 말해, 수평각과 타원체 거리가 같이 있는 관측치는 이 두 필터 옵션을 동시에 선택하지 않는 한, 얻지 못하게 됩니다.

  [방위각] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 키입력된 방위각이 있는 관측치만 표시되게 됩니다.

  [델타 표고] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 레벨 데이터가 선택되게 됩니다.

  원시 관측치를 보고자 하면 [수평각], [타원체 거리], [삼각 표고] 확인란을 선택합니다.

5.	[확인] 단추를 누릅니다.

선택한 관측치 종류가 보이지 않게 되지만 망 조정에는 여전히 쓰입니다.


지오이드 분리 간격 로드하기

 개요 및 추가 정보

표고를 계산하거나 고정하기 전에 프로젝트의 지오이드 모델을 지정하고 지오이드 분리 간격을 프로젝트에 로드하지 않으면 안됩니다.

일반적으로, 지오이드 분리 간격은 해당 지오이드 모델의 정의 데이텀에 의거, 완전 제약 조정을 하여 포인트의 좌표를 모두 산출한 후 로드합니다.

참조: 이 도움말 파일에서 쓰는 지오이드 관측치라는 용어는 망 조정에 적용하는 지오이드 분리 간격을 이르는 말입니다. 지오이드 관측치는 프로젝트에 로드되지만 망 조정에만 쓰입니다.

지오이드 분리 간격 로드 방법:

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[지오이드] 탭을 선택합니다.

3.	다음 중 하나를 수행합니다.

  지오이드 분리 간격이 이미 로드되어 있다면 관측치들이 [관측치] 목록에 나오므로 이 로드 작업을 더 이상 진행하지 않아도 됩니다.

  [관측치] 목록이 비어 있다면 프로젝트에 로드된 지오이드 분리 간격이 없는 것이므로 이 로드 작업을 계속 진행하여야 합니다.

4.	[로드] 단추를 누릅니다. 대응하는 모든 포인트의 지오이드 분리 간격이 프로젝트에 로드되어 [관측치] 목록에 표시됩니다.

참조: 프로젝트에 정의된 지오이드 모델이 없을 경우에는 [로드] 단추가 기능 해제됩니다.

참조: 지오이드 관측치는 현재의 포인트 위치에서 보간됩니다. 포인트들의 위치가 상당히 변경되었다면 지오이드 관측치를 다시 로드하여야 합니다.

5.	[확인] 단추를 누릅니다.

변경 내용이 저장됩니다.


목록 열 이동하기

 개요 및 추가 정보

[관측치] 목록의 열은 그 목록 내의 다른 위치로 이동할 수 있습니다.

열을 이동하는 방법:

1.	아무 관측치 목록에서나 해당 열의 헤더에 커서를 둡니다. 헤더는 열의 제목이 있는 곳으로서 데이터의 첫째 행 위에 위치합니다.

2.	다음 중 하나를 실행합니다.

  열을 오른쪽으로 이동하려면 그 헤더를 오른쪽으로 드래그 합니다. 헤더의 왼쪽 끝이 열을 삽입하고자 하는 위치를 지날 때까지 끈 다음, 마우스 단추를 놓습니다.

  열을 왼쪽으로 이동하려면 그 헤더를 왼쪽으로 드래그 합니다. 헤더의 오른쪽 끝이 열을 삽입하고자 하는 위치를 지날 때까지 끈 다음, 마우스 단추를 놓습니다.


망 조정 보고서 살펴보기

 개요 및 추가 정보

사용자의 기본 HTML 뷰어에서 그 뷰어의 명령을 이용하여 망 조정 보고서를 봅니다.

방법:

  목차 하이퍼링크를 이용하여 각 보고서 섹션으로 이동합니다.

  그 HTML 뷰어의 명령을 이용하여 페이지의 위로 돌아갑니다. 대부분의 뷰어에는 [뒤로] 단추가 이 기능을 합니다.

  Page Up 키나 Page Down 키, 스크롤 바를 써서 보고서 섹션으로 찾아갑니다.

  <Alt+Tab>을 눌러 Trimble Geomatics Office 소프트웨어와 그 HTML 뷰어 사이를 왔다갔다 합니다.


망 조정 제거하기

 개요 및 추가 정보

이 명령을 써서 망의 설정을 조정 전 상태대로 되돌립니다.

조정된 값을 제거하려면 [조정 / 조정 제거] 명령을 선택합니다.

이 명령을 실행하면:

  데이텀이 WGS-84로 설정됩니다.

  고정 상태인 포인트가 하나도 없게 됩니다.

  오차 타원이 제거됩니다.

  지오이드 관측치가 언로드 됩니다.

  망 조정 전에 캘리브레이션이 있었다면 이것이 재적용됩니다.

  조정된 좌표가 제거됩니다.

참조: 망 조정에의 이용이 해제된 관측치는 원래 상태로 재설정되지 않습니다.


캘리브레이션 좌표 제거하기

 개요 및 추가 정보

최소 제약 조정 후 프로젝트에 저장된 캘리브레이션 좌표를 제거할 수 있습니다.

캘리브레이션 좌표의 제거는 [조정 / 캘리브레이션 좌표 / 제거] 명령으로 실행합니다.

프로젝트에서 캘리브레이션 좌표가 제거됩니다.


변환 그룹 관측치 제거하기

 개요 및 추가 정보

사용자가 만든 GPS 변환 그룹이나 비GPS 변환 그룹에서 관측치를 제거할 수 있습니다.

참조: <지오이드 기본값> 변환 그룹에서는 관측치를 제거하지 못합니다.

GPS 변환 그룹에서 관측치를 제거하는 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	그룹을 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

5.	제거하고자 하는 관측치를 [그룹 관측치] 목록에서 선택합니다. [제거] 단추가 활성화됩니다.

6.	[제거] 단추를 누르면 이 관측치가 해당 그룹에서 제거되고 [이용 가능 관측치] 목록에 나옵니다.

7.	[확인] 단추를 누릅니다.

변경 내용이 프로젝트에 저장됩니다.


분산 그룹 관측치 제거하기

 개요 및 추가 정보

GPS 분산 그룹이나 비GPS 분산 그룹에서 관측치를 제거할 수 있습니다.

참조: <지오이드 기본값> 분산 그룹에서는 관측치를 제거하지 못합니다.

관측치 제거 방법:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	원하는 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [분산 그룹 편집] 대화 상자가 나옵니다.

5.	제거하고자 하는 관측치를 [그룹 관측치] 목록에서 선택합니다. 그 관측치가 하이라이트되고 [제거] 단추가 활성화됩니다.

6.	[제거] 단추를 누르면 그 관측치가 해당 그룹에서 제거되고 [이용 가능 관측치] 목록에 나옵니다.

팁: [이용 가능 관측치] 목록의 필터링을 할 수 있습니다. 특정 종류의 관측치를 숨기면 목록에 표시되는 관측치의 수가 적어져 관측치를 더 빨리 찾을 수 있습니다.

7.	[확인] 단추를 눌러 변경 내용을 적용합니다.


망 조정 스타일 이름 변경

 개요 및 추가 정보

조정 스타일은 조정 작업간 아무 때나 이름을 바꿀 수 있습니다.

스타일의 이름 변경 방법:

1.	[조정 / 조정 스타일] 명령을 실행하여 [망 조정 스타일] 대화 상자를 불러옵니다.

2.	원하는 스타일을 스타일 목록에서 선택합니다.

3.	[이름 변경] 단추를 누르면 [스타일 이름 변경] 대화 상자가 나옵니다.

4.	[이름] 필드에 새 스타일의 이름을 쳐넣습니다.

5.	[확인] 단추를 누릅니다.

변경 내용이 저장되고 [망 조정 스타일] 대화 상자로 되돌아 갑니다.


목록 열 크기 조정

 개요 및 추가 정보

[관측치] 목록의열은 그 크기를 조절하여 정보를 숨기거나 표시할 수 있습니다.

열의 크기를 조정하는 방법:

1.	크기를 조정하고자 하는 열 헤더의 오른쪽으로 점차 커서를 이동하다 보면 크기 조정 커서가 나옵니다. 헤더는 열의 제목이 있는 곳으로서 데이터의 첫째 행 위에 위치합니다.

2.	열 헤더를 좌우로 드래그 하여 알맞은 폭으로 맞춥니다. 헤더가 이동함에 따라 열의 폭이 늘어나거나 줄어듭니다.

이제 열의 크기가 조절되었습니다.


캘리브레이션 좌표 저장하기

 개요 및 추가 정보

WGS-84 데이텀 하의 GPS 데이터로써 최소 제약 조정을 끝내고 이 망 조정의 각 포인트에 대하여 WGS-84 좌표를 설정하고 나면 이 좌표를 사이트 캘리브레이션 용 GPS 관측 좌표로서 쓸 수 있습니다.

캘리브레이션 좌표는 WGS-84 위도, 경도, 타원체 고도로 구성됩니다.

참조: 이 명령은 조정 데이텀이 WGS-84로 설정되어 있고, GPS 데이터로써만 조정이 수행된 경우에 한해 이용할 수 있습니다.

캘리브레이션 좌표 저장 방법:

1.	[조정 / 캘리브레이션 좌표 / 저장] 명령을 실행하여 [캘리브레이션 좌표 저장] 대화 상자를 불러옵니다.

2.	기존 포인트 하에 좌표를 만드는 옵션이나 접미어가 붙은 새 포인트 하에 좌표를 만든 옵션을 선택합니다.

3.	[확인] 단추를 누릅니다.

캘리브레이션 좌표가 저장되어 등록 정보 창에 나타납니다.


조정 데이텀 선택하기

 개요 및 추가 정보

조정 작업시 데이텀 정의를 설정할 수 있습니다. 이 설정은 [프로젝트 등록 정보] 대화 상자에서 설정한 프로젝트 데이텀을 바뀌게 하지 않습니다. 최소 제약 GPS 조정 도중에는 데이텀을 WGS-84로 설정하는 것이 보통이고, 비GPS 데이터의 최소 제약 조정에 앞서서는 데이텀을 프로젝트 데이텀으로 설정합니다. 일단 완전 제약 조정의 준비가 되면 데이텀을 프로젝트 데이텀으로 설정하게 됩니다.

1.	[조정 / 데이텀] 명령을 실행하면 아래와 같은 데이텀 하위 메뉴가 나옵니다.

  WGS-84

  프로젝트 데이텀 − <데이텀 이름>

2.	원하는 데이텀을 선택합니다.


고정 상태를 설정하여 좌표 제약하기

고정 설정을 이용하면 망 조정 포인트의 좌표 구성 요소를 제약할 수 있습니다.

참조: [포인트] 대화 상자에서 포인트의 좌표 구성 요소(2D, 고도, 표고)를 고정할 때 조정된 좌표가 만들어집니다. 조정된 좌표는 등록 정보 창에서 볼 수 있습니다.

고정 설정을 하는 방법:

1.	[조정 / 포인트] 명령을 실행하여 [포인트] 대화 상자를 불러옵니다.

2.	원하는 포인트를 스크롤 바로 찾아 선택합니다.

3.	좌표 구성 요소를 편집하면 이것이 [고정] 옵션 상자에서 자동으로 고정됩니다.

참조: [고정] 열에서 이미 (NE, e, h)로 입력된 기준 좌표가 있는 포인트를 식별할 수 있습니다. 괄호는 이 포인트가 아직 고정되지 않았음을 의미합니다.

참조: 이미 고정된 좌표 구성 요소를 해제하면 원래 좌표 값(편집 전 대화 상자에 있던 값)으로 되돌아 갑니다.

참조: 언제라도 고정 설정을 해제함으로써 해당 포인트에 지정된 좌표 제약을 풀 수 있습니다.

4.	[확인] 단추를 누릅니다.

변경 내용이 프로젝트에 저장됩니다.


목록 열 정렬하기

 개요 및 추가 정보

[포인트] 목록이나 [관측치] 목록을 오름차순/내림차순으로 정렬할 수 있습니다.

처음에 [관측치] 목록은 그 상단에 잔차가 표시되어 정렬되고 [포인트] 목록은 고정된 포인트가 먼저 나오는 순서로 정렬됩니다. 아무 열이나 그 헤더를 클릭하면 열의 내용을 기준으로 오름차순/내림차순으로 정렬할 수 있습니다.

열 정렬 방법:

1.	정렬하고자 하는 열의 헤더에 커서를 둡니다. 헤더는 열의 제목이 있는 곳으로서 데이터의 첫째 행 위에 위치합니다.

2.	마우스의 왼쪽 단추를 한 번 눌러 열을 오름차순으로 정렬합니다.

상기 과정을 반복하면 이 열을 내림차순으로 되돌릴 수 있습니다. 또는 다른 열을 오름차순/내림차순으로 정렬할 수도 있습니다. 목록에 포함된 데이터의 양이 많을 경우, 열을 정렬하면 데이터를 찾기 쉬워집니다.


망 조정하기

 개요 및 추가 정보

망 조정은 최소 제약 조정으로 시작해서 연속적인 후속 조정을 수행해 가는 반복 연산 과정입니다. 여기에서는 다른 항목들에 대한 참조와 함께, 조정을 시작하는 기본 지침만 설명합니다. 망을 점진적으로 수렴시키기 위한 수행 작업과 관련, 보다 구체적인 내용은 이 항목들을 보도록 합니다.

첫 조정을 시작하기 전에 다음 항목들을 검토하도록 합니다.

1.	조정 데이텀

2.	망 조정 스타일

3.	관측치

4.	포인트

5.	고정 포인트

6.	포함시키기 및 제외하기

7.	스칼라 가중 전략 설정

8.	지오이드 분리 간격의 로드 및 언로드

9.	분산 그룹 만들기나 편집하기

10.변환 그룹 만들기나 편집하기

조정

다음 과정을 밟아 조정을 시작합니다.

1.	다음 중 하나를 이용하여 조정을 시작합니다.

  [조정 / 조정] 명령을 실행합니다.

  F10을 누릅니다.

망 조정이 진행됨에 따라 진척도 메시지가 상태 표시줄에 나오고 그 조정 결과가 그래픽 창에 표시됩니다.

2.	조정이 완료되면 망 조정 보고서를 보고 그 결과를 검토합니다.

보고서에는 조정 도중 생긴 데이터와 함께 조정 성공 여부를 나타내는 메시지가 나옵니다.


지오이드 분리 간격 언로드하기

 개요 및 추가 정보

조정에서 지오이드 분리 간격을 언로드할 수 있습니다.

참조: 언로드된 지오이드 분리 간격은 조정에서만 제거되지 프로젝트에서는 제거되지 않습니다. 여전히 지오이드를 프로젝트에 선택하고 재계산에 쓸 수 있습니다.

참조: 이 도움말 파일에서 쓰는 '지오이드 관측치'라는 용어는 망 조정에 적용하는 지오이드 분리 간격을 이르는 말입니다.

지오이드 분리 간격 언로드 방법:

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[지오이드] 탭을 선택합니다.

3.	로드되어 있는 지오이드 분리 간격이 있는지 확인합니다.

  [관측치] 목록이 비어 있다면 프로젝트에 로드된 지오이드 분리 간격이 없는 것이므로 언로드 작업을 진행하지 않아도 됩니다.

  [관측치] 목록에 관측치들이 나오면 지오이드 분리 간격이 로드되어 있는 것이므로 언로드 작업을 진행할 수 있습니다.

4.	[언로드] 단추를 누르면 조정으로부터 지오이드 분리 간격이 언로드되고 [관측치] 목록이 지워집니다.

5.	[확인] 단추를 누릅니다.

변경 내용이 저장됩니다.


GPSurvey 데이터 이용하기

 개요 및 추가 정보

Trimble GPSurvey 망의 데이터를 써서 Trimble Geomatics Office 소프트웨어를 이용할 수 있습니다. 이 경우, 가져오기 작업이 추가로 필요합니다. 기선 해 파일(.ssf 및 .ssk)을 프로젝트로 가져와서 Trimble Geomatics Office 소프트웨어에서 이 기선(관측치)들을 조정하지 않으면 안됩니다. 또한 GPSurvey에서 만든 ASCII 파일을 이용하여, 알려진 기준점들을 가져오도록 합니다.

GPSurvey 데이터를 가져오는 방법:

1.	새 Trimble Geomatics Office 프로젝트를 만듭니다. 그 등록 정보를 해당 GPSurvey 프로젝트의 그것과 동일하게 설정합니다.

2.	[파일 / 가져오기] 명령을 실행합니다.

3.	[측량 데이터] 탭을 선택합니다.

4.	'SSF/SSK 파일 (*.ssf, *.ssk)' 옵션을 선택합니다.

5.	[확인] 단추를 누릅니다.

6.	원하는 파일들이 있는 \GPSurvey\Projects\*Projectname*\Trimvec 폴더로 찾아갑니다.

7.	이 파일들을 하이라이트 합니다.

8.	[열기] 단추를 누르면 가져오기가 시작되고 화면에 기선이 표시됩니다.

9.	상기 절차에 의거, ASCII 파일을 가져오려면 [가져오기] 대화 상자에서 [사용자] 탭을 이용합니다.

이제 GPS 데이터를 추가로 더 가져와서 Trimble Geomatics Office 소프트웨어상의 조정 작업을 할 준비가 되었습니다.


변환 매개 변수 확인하기

 개요 및 추가 정보

조정 작업간 아무 때나 변환 매개 변수를 확인할 수 있습니다.

확인 방법:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	스크롤 바를 이용하여 원하는 그룹을 찾습니다.

4.	이 그룹을 선택합니다.

5.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

이 그룹에 지정된 이름이 [그룹 이름] 필드에 나옵니다. [그룹 관측치] 목록에는 그룹 관측치가 나오고, [이용 가능 관측치] 목록에는 이용 가능한 프로젝트 관측치가 나옵니다. 왼쪽 상단의 [변환 매개 변수] 목록에는 현재의 변환 매개 변수 설정이 표시됩니다.

6.	[변환 매개 변수] 목록의 변환 매개 변수를 확인합니다.

7.	필요한 경우, 변환 매개 변수를 편집합니다.

변환 매개 변수의 정의 지침은 다음 항목을 참조합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

8.	대화 상자를 종료합니다.

  변경 내용을 저장하지 않으려면 [취소] 단추를 누릅니다.

  변환 매개 변수의 편집 내용을 저장하려면 [확인] 단추를 누릅니다.


카이 자승 검정 결과 보기

 개요 및 추가 정보

카이 자승 검정은 망 기준 계수(RF)와 자유도의 평가입니다. 만일 RF가 1.0에 근접하고 자유도가 수용 가능한 수준이며 망이 수학적으로 잘 구성되어 있다면 그 망 조정은 카이 자승 검정을 통과하게 됩니다.

카이 자승 검정 결과를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다. [카이 자승 검정] 필드가 나옵니다.

3.	결과를 본 다음, HTML 뷰어를 종료합니다.


기준점 고정 상태 보기

망 조정에 포함된 기준점들의 고정 상태를 조정 작업간 아무 때나 볼 수 있습니다.

1.	[조정 / 포인트] 명령을 실행하여 [포인트] 대화 상자를 불러옵니다.

2.	스크롤 바를 이용하여 해당 기준점들을 봅니다.

기준점 좌표 구성 요소의 고정 상태는 체크 표가 표시되면 설정되고, 체크 표가 없어지면 해제됩니다. 또한 해당 좌표 구성 요소가 [고정] 열에 나오거나, 기준 등급 포인트의 식별자로부터 괄호가 제거됩니다.

3.	[취소] 단추를 누릅니다. 변경 내용이 프로젝트에 저장되지 않습니다.

참조: 좌표의 질을 등록 정보 창에서 볼 수도 있습니다. 고정 상태의 포인트는 고정 기준점으로 표시됩니다.


자유도 보기

 개요 및 추가 정보

이 통계를 이용하여 망의 여유도 수를 봅니다.

자유도 값을 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다.

이 보고서 섹션에 [자유도] 필드가 있습니다.

자유도는 해의 과결정에 쓰이는 독립 관측치(조정에 포함된)의 수를 나타냅니다. 모든 관측치가 독립적이라면 그 수가 클수록 좋습니다. 자세한 내용은 독립 기선 선택하기를 참조하십시오.

3.	자유도 값을 본 다음, HTML 뷰어를 종료합니다.


망 기준 계수 보기

 개요 및 추가 정보

이 값을 보면 조정 선험 오차가 얼마나 잘 관측 잔차에 일치하는지 알 수 있습니다. 즉, 망 기준 계수는 우연 오차가 이 관측치의 추정 오차에 부합하는 정도를 표시합니다.

망 기준 계수의 값을 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행합니다.

기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다.

이 보고서 섹션에 [망 기준 계수] 필드가 있습니다.

3.	망 기준 계수 값을 본 다음, HTML 뷰어의 종료 명령(일반적으로 [파일 / 종료])을 실행합니다.


망 조정 보고서 보기

 개요 및 추가 정보

조정이 끝나면 망 조정 보고서를 봅니다.

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다.

2.	조정 결과를 보는 방법:

  목차 하이퍼링크를 이용하여 각 보고서 섹션으로 이동합니다.

  그 HTML 뷰어의 명령을 이용하여 페이지의 위로 돌아갑니다. 대부분의 HTML 뷰어에는 [뒤로] 단추가 이 기능을 합니다.

  Page Up 키나 Page Down 키, 스크롤 바, 기타 HTML 명령을 써서 보고서 섹션으로 찾아갑니다.

  <Alt+Tab>을 눌러 Trimble Geomatics Office 소프트웨어와 그 HTML 뷰어 사이를 왔다갔다 합니다. 매번 <Alt+Tab>을 누를 때마다 열려 있는 다음 창으로 전환합니다.

  기본 HTML 뷰어는 별개의 프로그램이므로 최소화하여 작업 표시줄에 아이콘화한 후, Trimble Geomatics Office 소프트웨어로 되돌아가서 이 보고서 결과를 검토하고 망 조정 변경을 할 수 있습니다. 그 다음, HTML 뷰어 창을 최대화하여 보고서를 다시 보면서 추가 검토 작업을 합니다. 이 과정은 필요한 횟수만큼 반복할 수 있습니다.

  보고서를 직접 인쇄해서 망 조정 결과를 검토해 보고자 할 수 있습니다. HTML 뷰어의 인쇄 명령(일반적으로 [파일 / 인쇄])을 실행하면 됩니다.

  보고서를 보존용이나 추후 인쇄용으로 하고자 파일로 인쇄, 기록할 수 있습니다.

  Adobe� Acrobat�가 설치되어 있다면 보고서를 파일에 인쇄한 다음, 이 파일을 적절히 조정할 수 있습니다. 하이퍼링크가 있는 보고서 문서화 작업이 가능해집니다.

  HTML 뷰어의 전자 우편 명령을 이용하여 다른 사람에게 이 보고서를 보낼 수 있습니다. 실시간 응용 프로그램의 경우, 이것은 현장에 있는 측량자에게 보고서를 보내고자 할 때 유용하게 쓰입니다. 또한 보고서 데이터를 현장에서 중앙 자료실로 전송할 때에도 유용합니다.

3.	HTML 뷰어를 닫습니다.


조정에 선택된 관측치 보기

 개요 및 추가 정보

조정에 쓰인 관측치를 체크하기 위하여 [관측치] 목록을 봅니다.

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다. 해당 [관측치] 목록이 나옵니다.

3.	스크롤 바를 써서 목록을 살펴봅니다.

4.	이 관측치를 보고 나서 [취소] 단추를 누릅니다.

변경 내용이 프로젝트에 저장되지 않습니다.


변환 그룹 관측치 보기

 개요 및 추가 정보

변환 그룹 관측치는 조정 작업간 아무 때나 볼 수 있습니다.

변환 그룹 관측치를 보려면:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	스크롤 바를 이용하여 목록에서 원하는 그룹을 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

이 그룹에 지정된 이름이 [그룹 이름] 필드에 나옵니다. [그룹 관측치] 목록에는 그룹 관측치가 나오고, [이용 가능 관측치] 목록에는 이용 가능한 프로젝트 관측치가 나옵니다.

5.	이 그룹 관측치를 보고 나서 [취소] 단추를 누릅니다.

변경 내용이 프로젝트에 저장되지 않습니다.


변환 그룹 보기

 개요 및 추가 정보

변환 그룹은 조정 작업간 아무 때나 볼 수 있습니다.

변환 그룹을 보려면:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	스크롤 바를 이용하여 목록에서 원하는 그룹을 찾습니다.

4.	이 그룹을 선택합니다.

5.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

이 그룹에 지정된 이름이 [그룹 이름] 필드에 나옵니다. [그룹 관측치] 목록에는 그룹 관측치가 나오고, [이용 가능 관측치] 목록에는 이용 가능한 프로젝트 관측치가 나옵니다. 왼쪽 상단의 [변환 매개 변수] 목록에는 현재의 변환 매개 변수 설정이 표시됩니다.

팁: 프로젝트 등록 정보 창에 있는 [좌표계] 탭의 [조정] 탭 하에서도 변환 매개 변수를 볼 수 있습니다.

6.	이 그룹을 보고 나서 [취소] 단추를 누릅니다.

변경 내용이 프로젝트에 저장되지 않습니다.


변환 매개 변수 보기

 개요 및 추가 정보

변환 매개 변수는 조정 작업간 아무 때나 볼 수 있습니다.

팁: 프로젝트 등록 정보 창에 있는 [좌표계] 탭의 [조정] 탭 하에서도 변환 매개 변수를 볼 수 있습니다.

변환 매개 변수를 보려면:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	원하는 변환 그룹을 목록에서 선택합니다.

4.	[편집] 단추를 누르면 [변환 그룹 편집] 대화 상자가 나옵니다.

[변환 매개 변수] 목록은 이 대화 상자의 왼쪽 상단, [그룹 이름] 필드 아래에 있습니다.

개별 매개 변수에 대한 자세한 내용은 다음 항목을 참조하십시오.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다.

자세한 사항은 변환 매개 변수를 참조하십시오.


분산 그룹 관측치 보기

 개요 및 추가 정보

다음 순서에 따라 지오이드 관측치나 GPS 관측치의 분산 그룹을 봅니다.

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭을 선택합니다.

3.	분산 그룹을 하나 선택합니다.

4.	[편집] 단추를 누르면 관측치의 목록이 있는 [분산 그룹 편집] 대화 상자가 나옵니다.

5.	스크롤 바를 써서 관측치 목록을 살펴봅니다.

6.	[취소] 단추를 눌러 변경 내용을 프로젝트에 저장하지 않도록 합니다.


망 조정에 기선 포함시키기

 개요 및 추가 정보

망 조정으로부터 제거한 기선은 그 등록 정보를 수정하여 추후의 망 조정에 다시 포함시킬 수 있습니다.

참조: 망 조정에 쓰기 위해서는 또한 이 기선을 이용 상태로도 설정해 두어야만 합니다.

기선을 추후의 망 조정에 포함시키는 방법:

1.	포함시키고자 하는 기선을 더블 클릭합니다. 등록 정보 창이 나옵니다.

2.	등록 정보 창에서 요약 페이지를 엽니다.

3.	[망 조정에 이용] 확인란을 선택합니다.

4.	[확인] 단추를 누릅니다.


망 조정으로부터 관측치 제거하기

 개요 및 추가 정보

관측치는 그 등록 정보를 변경함으로써 추후의 망 조정으로부터 제거할 수 있습니다.

방법:

1.	제거하고자 하는 관측치를 더블 클릭합니다. 등록 정보 창이 나옵니다.

2.	요약 페이지 [image] 단추를 누릅니다. 망 조정에 포함된 관측치는 이 페이지의 [망 조정에 이용] 확인란이 선택되어 있습니다.

3.	이 확인란을 선택 해제합니다.

4.	[확인] 단추를 누릅니다.

참조: [관측치] 대화 상자로써도 관측치를 망 조정으로부터 제거할 수 있습니다.


망 조정으로부터 관측치 제외하기

 개요 및 추가 정보

관측치를 가져올 때, 조정 가능 관측치는 모두 표시가 됩니다. 하지만 [관측치] 대화 상자를 이용하여 개별 관측치들을 조정으로부터 제외시킬 수 있습니다. 제외된 관측치라도 프로젝트로부터 삭제되지는 않습니다.

관측치 제외 방법:

1.	[조정 / 관측치] 명령을 실행하여 [관측치] 대화 상자를 불러옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	제외하고자 하는 관측치를 [관측치] 목록에서 찾습니다.

팁: [이용 가능 관측치] 목록의 필터링을 함으로써 관측치들을 숨기거나 표시할 수 있습니다. 특정 종류의 관측치를 숨기면 목록의 크기가 일시적으로 작아지므로 관측치를 찾기 용이합니다.

4.	관측치의 [사용] 열을 꼭 선택 해제하도록 합니다.

5.	관측치를 제외한 다음, [확인] 단추를 눌러 변경 내용을 프로젝트에 저장합니다.

참조: 등록 정보 창의 요약 페이지에서 [망 조정에 이용] 확인란을 선택 해제함으로써 조정으로부터 관측치를 제외시킬 수도 있습니다

조정으로부터 제외한 관측치를 다시 포함시킬 수 있습니다.

참조: 관측치를 이용 해제하거나 재이용할 수도 있습니다. 자세한 사항은 관측치 이용 해제하기와 이용 해제된 관측치의 재이용을 참조하십시오.


이용 해제된 관측치를 망 조정에 재이용하기

 개요 및 추가 정보

[관측치] 대화 상자나 그래픽 창으로부터 이용 해제된 관측치를 다시 이용 상태로 만들 수 있습니다. 재이용 처리된 관측치는 다시 [관측치] 대화 상자에 나오고 망 조정과 재계산에 쓰이게 됩니다.

참조: 관측치의 '재이용하기'와 '포함시키기'는 서로 다른 별개의 작업입니다. 제외된 관측치는 [관측치] 대화 상자에서 해당 관측치의 [사용] 확인란을 선택하거나, 또는 등록 정보 창에서 요약 페이지의 [망 조정에 이용] 확인란을 선택함으로써 추후의 망 조정에 포함시킬 수 있습니다. 이용 해제된 관측치는 [관측치] 대화 상자로부터 재이용 처리할 수 없습니다. 그래픽 창에서 해당 관측치를 선택하여 그 등록 정보 창을 봄으로써 다시 이용 상태로 만들어야 합니다. 자세한 내용은 조정에 관측치 포함시키기를 참조하십시오.

그래픽 창에서 관측치를 이용 상태로 설정하려면:

1.	원하는 관측치를 더블 클릭합니다. 이용 해제된 관측치는 그래픽 창에서 빨간색으로 표시됩니다.

2.	등록 정보 창이 나옵니다.

3.	요약 페이지 [image] 단추를 눌러 요약 페이지를 불러옵니다

4.	[상태] 목록에서 '이용' 옵션을 선택합니다.

5.	[망 조정에 이용] 확인란을 꼭 선택하도록 합니다.

6.	이 관측치가 다시 '이용 상태'로 되어 추후의 망 조정과 재계산에 쓰이게 됩니다. 또한 그래픽 창에서 빨간색으로 표시되지도 않습니다.

참조: 관측치를 포함/제외시키는 것과 관련, 자세한 내용은 관측치 포함시키기와 관측치 제외하기를 참조하십시오.


상이한 종류의 관측치를 망 조정에서 결합하기

조정된 좌표의 집합을 도출하기 위하여 망 조정에서 GPS 관측치와 비GPS 관측치, 지오이드 관측치를 결합할 수 있습니다.

관측치들을 결합하려면 비GPS 관측치를 GPS 망에 결속하여야만 합니다. 그렇지 않으면 망 조정 수행시 오류 메시지가 나올 수 있습니다. 결속을 하려면 GPS 망의 공통 포인트에서 각도와 거리를 측정합니다. GPS와 비GPS 데이터 집합을 결속할 수 있는 공통 포인트(GPS와 비GPS 데이터 집합으로 관측된 포인트, 또는 기준점)를 최소한 2개 이상 쓰도록 합니다.

완전 제약 망 조정을 수행하기 전에는 오차를 쉽게 찾아낼 수 있도록 각 관측치 집합을 점검합니다. 또한 GPS 관측치와 비GPS 관측치에 대하여 별도의 최소 제약 조정을 수행할 필요도 있습니다.

망 조정에서 관측치들을 결합하는 절차는 몇몇 기본적인 단계로 구성됩니다. 다음은 이 절차에 대한 간략한 요약입니다.

1.  데이터 가져오기

1.	프로젝트와 관련된 기준 등급의 포인트가 있으면 먼저 이들을 Trimble Geomatics Office 프로젝트에 가져옵니다. 이것은 이 기준점 좌표를 재계산의 시점으로 쓰기 위함입니다. 자세한 내용은 재계산 및 망 조정에서 좌표 균질화의 중요성을 참조하시기 바랍니다.

2.	기타 다른 데이터 집합을 모두 프로젝트에 가져옵니다. 오류 플래그는 반드시 전부 조사합니다.

참조: 데이터를 가져올 때, [중복 포인트 옵션] 대화 상자에서 '항상 중복 포인트 병합' 옵션이 선택되어 있지 않은 상태라면 중복 포인트를 병합할 필요가 있습니다.

2.	GPS 데이터 준비

GPS 관측치에 최소 제약 조정을 수행하려면 다음 작업을 합니다.

1.	그래픽 창에서 해당 GPS 데이터를 선택합니다.

2.	이 GPS 데이터를 처리합니다.

3.	GPS 루프 폐합을 수행한 후, 루프 폐합 보고서를 보아서 그 GPS 관측치가 망 조정에 적합한 것인지 확인합니다.

4.	허용 편차 밖 플래그를 모두 제거합니다. 이 플래그의 원인으로는 부정확한 기준점 좌표, 안테나 높이 불량, 잘못된 포인트 이름 명명 등을 들 수 있습니다.

5.	독립 GPS 기선을 선택합니다.

6.	WGS-84 데이텀을 선택합니다.

7.	조정 스타일을 선택합니다. 필요한 경우, 이 조정 스타일의 설정을 변경합니다.

8.	조정에 포함할 관측치를 [관측치] 대화 상자의 [GPS] 탭 하에서 선택합니다.

팁: [관측치] 대화 상자의 [필터] 단추를 이용하여 관측치 종류의 필터링를 합니다.

9.	필요한 경우, 해당 데이터에 대한 관측치 그룹(분산 그룹 및/또는 변환 그룹)을 정의합니다.

10 .[포인트] 대화 상자에서 기준점을 하나 고정합니다. 이것은 선택 사항입니다.

11. 가중 전략을 설정합니다. 첫 조정에 대하여 [스칼라 적용 대상]을 '모든 관측치', [스칼라 형]을 '기본값' 옵션으로 각각 설정합니다.

12. 최소 제약 조정을 수행합니다.

13 망 조정 보고서에서 조정 내역을 봅니다.

14. 필요한 경우, 스칼라 형을 '대체'로 설정하여 조정을 계속해 가면서 망 조정 보고서를 검토합니다. 카이 자승 검정에 통과하고 조정 결과에 만족할 때까지 이것을 계속합니다.

참조: [가중 전략] 대화 상자에서 '자동' 스칼라 형 옵션을 선택했다면 카이 자승 검정에 통과할 때까지 조정 반복 연산이 계속됩니다.

15. '대체' 스칼라 옵션을 선택한 경우, 마지막 반복 연산이 끝나면 [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

16. GPS 사이트 캘리브레이션을 수행할 예정이라면 캘리브레이션 좌표를 저장합니다. WGS-84 좌표가 저장되게 됩니다.

이제 GPS 관측치에 대하여 완전 제약 조정을 할 준비가 되었습니다.

3. 비GPS 데이터 준비

비GPS 관측치에 최소 제약 조정을 수행하려면 다음 작업을 합니다.

1.	그래픽 창에서 해당 비GPS 데이터를 선택합니다.

팁: 보기 필터를 써서 비GPS 관측치만 표시할 수 있습니다.

2.	프로젝트 데이텀을 선택합니다.

3.	조정에 포함할 관측치를 [관측치] 대화 상자의 [비GPS] 탭 하에서 선택합니다.

참조: 비GPS 데이터가 폐합 트래버스로 구성되지 않으면(즉, 비GPS 관측치가 GPS 관측치 망에 매달려 있음), 지오이드 관측치를 로드하여 GPS 관측치와 비GPS 관측치를 상호 연계할 필요도 있습니다. 이 단계에서 지오이드 데이터를 비GPS 조정에 통합시키면 다음의 제 4 단계를 수행할 필요가 없습니다.

4.	필요한 경우, 해당 데이터에 대한 관측치 그룹(분산 그룹이나 변환 그룹)을 정의합니다.

5	가중 전략을 설정합니다. 첫 조정에 대하여 [스칼라 적용 대상]을 '모든 관측치', [스칼라 형]을 '기본값' 옵션으로 각각 설정합니다.

6.	[포인트] 대화 상자에서 포인트를 고정합니다.

참조: 결합 조정을 수행하기 위해서는 고정하는 포인트가 GPS와 비GPS 망에 공통되는 포인트 중 하나여야 합니다.

7.	최소 제약 조정을 수행합니다.

8	망 조정 보고서에서 조정 내역을 봅니다.

9.	필요한 경우, 스칼라 형을 '대체'로 설정하여 다음 조정을 수행하고 망 조정 보고서를 검토합니다. 조정 결과에 만족할 때까지 이것을 계속합니다.

참조: [가중 전략] 대화 상자에서 '자동' 스칼라 형 옵션을 선택했다면 카이 자승 검정에 통과할 때까지 조정 반복 연산이 계속됩니다.

10. '대체' 스칼라 옵션을 적용한 경우, [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

이제 비GPS 관측치에 대하여 완전 제약 조정을 할 준비가 되었습니다.

4.	지오이드 관측치를 조정에 통합

지오이드 오차는 관측치의 제약 조정에서 스케일링을 합니다. 지오이드 데이터의 수직 제약 조정을 수행하는 절차:

1.	프로젝트에 지오이드 모델이 선택되어 있는지 확인합니다. [프로젝트 등록 정보] 대화 상자의 좌표계 내역을 살펴보면 그 여부를 알 수 있습니다.

2. [관측치] 대화 상자에서 [지오이드] 탭을 선택하고 지오이드 관측치를 로드합니다.

3. 지오이드 가중 전략을 설정합니다. 첫 조정에 대하여 스칼라 형을 '기본값' 옵션으로 설정합니다.

4.	[포인트] 대화 상자에서 표고 및(또는) 고도를 고정합니다. Trimble이 권장하는 제약 조건의 수는 최소한 3개 이상입니다.

5.	조정을 수행합니다.

6.	망 조정 보고서에서 조정 내역을 봅니다.

7.	필요한 경우, 스칼라 형을 '대체'로 설정하여 다음 조정을 수행하고 망 조정 보고서를 검토합니다. 카이 자승 검정에 통과하고 조정 결과에 만족할 때까지 이것을 계속합니다.

8.	'대체' 스칼라 형 옵션을 적용한 경우, [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

5.	수평 제약 조정의 수행

최소 제약 조정에서 오차 스케일링이 끝나고 나면 완전 제약 조정을 수행할 수 있습니다.

방법:

1.	프로젝트 데이텀이 아직 선택되어 있는지 확인합니다.

2.	[포인트] 대화 상자에서 기준점들을 고정합니다.

참조: 결합 조정을 하기 위해서는 최소한 2개 이상의 GPS 점을 고정하여야 합니다. 가능하다면, 이들은 GPS와 비GPS 망의 공통 포인트여야 합니다.

3.	조정을 수행합니다.

4. 망 조정 보고서에서 조정 결과를 봅니다.

5.	필요한 경우, 조정 결과에 만족할 때까지 추가 조정을 계속해 갑니다.

팁: 조정이 수렴하지 않거나, 카이 자승 검정에 실패하거나, 또는 기준 계수가 수용 가능한 수준이 아니라면 기준점 좌표에 문제가 있을 수 있습니다. 불량 포인트를 찾을 때까지 [포인트] 대화 상자에서 포인트를 고정 해제하고(한 번에 하나씩) 완전 제약 조정을 재수행합니다. 문제점 해결에 대한 자세한 사항은 Network Adjustment User Guide를 참조하십시오.


GPS 관측치에 망 조정 수행하기

다음은 Trimble Geomatics Office 소프트웨어에서 GPS 관측치를 조정할 때 필요한 절차의 요약입니다.

1.  기준점 데이터 가져오기

1.	프로젝트와 관련된 기준 등급의 포인트가 있으면 먼저 이들을 Trimble Geomatics Office 프로젝트에 가져옵니다. 이것은 이 기준점 좌표를 재계산의 시점으로 쓰기 위함입니다. 자세한 내용은 재계산 및 망 조정에서 좌표 균질화의 중요성을 참조하시기 바랍니다.

2. 기타 다른 데이터 집합을 모두 프로젝트에 가져와서 체크합니다. 오류 플래그는 반드시 전부 조사합니다.

참조: 데이터를 가져올 때, [중복 포인트 옵션] 대화 상자에서 '항상 중복 포인트 병합' 옵션이 선택되어 있지 않은 상태라면 중복 포인트를 병합할 필요가 있습니다.

2.	GPS 데이터 준비

1.	GPS 데이터를 처리합니다.

2.	GPS 루프 폐합을 수행한 후, 루프 폐합 보고서를 보아서 그 GPS 관측치가 망 조정에 적합한 것인지 확인합니다.

3.	허용 편차 밖 플래그를 모두 제거합니다. 이 플래그의 원인으로는 부정확한 기준점 좌표, 안테나 높이 불량, 잘못된 포인트 이름 명명 등을 들 수 있습니다.

4.	독립 GPS 기선을 선택합니다.

5.	WGS-84 데이텀을 선택합니다.

6.	조정 스타일을 선택합니다. 필요한 경우, 이 조정 스타일의 설정을 변경합니다.

7.	조정에 포함할 관측치를 [관측치] 대화 상자의 [GPS] 탭 하에서 선택합니다.

팁: [관측치] 대화 상자의 [필터] 단추를 이용하여 관측치 종류의 필터링를 합니다.

8.	필요한 경우, 해당 데이터에 대한 관측치 그룹(분산 그룹 및/또는 변환 그룹)을 정의합니다.

9.	[포인트] 대화 상자에서 기준점을 하나 고정합니다. 이것은 선택 사항입니다.

10. 가중 전략을 설정합니다. 첫 조정에 대하여 [스칼라 적용 대상]을 '모든 관측치', [스칼라 형]을 '기본값' 옵션으로 각각 설정합니다.

11. 최소 제약 조정을 수행합니다.

12. 망 조정 보고서에서 조정 내역을 봅니다.

13. 필요한 경우, 스칼라 형을 '대체'로 설정하고 조정을 계속해 가면서 망 조정 보고서를 검토합니다. 카이 자승 검정에 통과하고 조정 결과에 만족할 때까지 이것을 계속합니다.

참조: [가중 전략] 대화 상자에서 '자동' 스칼라 형 옵션을 선택했다면 카이 자승 검정에 통과할 때까지 조정 반복 연산이 계속됩니다.

14. '대체' 스칼라 옵션을 선택한 경우, 마지막 반복 연산이 끝나면 [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

15. GPS 사이트 캘리브레이션을 수행할 예정이라면 캘리브레이션 좌표를 저장합니다. WGS-84 좌표가 저장되게 됩니다.

이제 GPS 관측치에 대하여 완전 제약 조정을 할 준비가 되었습니다.

3.	지오이드 관측치를 조정에 통합

지오이드 오차는 관측치의 제약 조정에서 스케일링을 합니다. 지오이드 데이터의 수직 제약 조정을 수행하는 절차:

1.	프로젝트에 지오이드 모델이 선택되어 있는지 확인합니다. [프로젝트 등록 정보] 대화 상자의 좌표계 내역을 살펴보면 그 여부를 알 수 있습니다.

2. [관측치] 대화 상자에서 [지오이드] 탭을 선택하고 지오이드 관측치를 로드합니다.

3.	지오이드 가중 전략을 설정합니다. 첫 조정에 대하여 스칼라 형을 '기본값' 옵션으로 설정합니다.

4.	[포인트] 대화 상자에서 표고 및(또는) 고도를 고정합니다. Trimble이 권장하는 제약 조건의 수는 최소한 3개 이상입니다.

5.	조정을 수행합니다.

6.	망 조정 보고서에서 조정 내역을 봅니다.

7.	필요한 경우, 스칼라 형을 '대체'로 설정하여 다음 조정을 수행하고 망 조정 보고서를 검토합니다. 조정 결과에 만족할 때까지 이것을 계속합니다.

8.	'대체' 스칼라 형 옵션을 적용한 경우, [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

4.	수평 제약 조정의 수행

최소 제약 조정에서 오차 스케일링이 끝나고 나면 완전 제약 조정을 수행할 수 있습니다.

방법:

1.	프로젝트 데이텀이 아직 선택되어 있는지 확인합니다.

2.	[포인트] 대화 상자에서 기준점들을 고정합니다.

3.	조정을 수행합니다.

4.망 조정 보고서에서 조정 결과를 봅니다.

5.	필요한 경우, 조정 결과에 만족할 때까지 추가 조정을 계속해 갑니다.

팁: 조정이 수렴하지 않거나, 카이 자승 검정에 실패하거나, 또는 기준 계수가 수용 가능한 수준이 아니라면 기준점 좌표에 문제가 있을 수 있습니다. 불량 포인트를 찾을 때까지 [포인트] 대화 상자에서 포인트를 고정 해제하고(한 번에 하나씩) 완전 제약 조정을 재수행합니다. 문제점 해결에 대한 자세한 사항은 Network Adjustment User Guide를 참조하십시오.


비GPS 관측치에 망 조정 수행하기

다음은 Trimble Geomatics Office 소프트웨어에서 비GPS 관측치를 조정할 때 필요한 절차의 요약입니다.

참조: Trimble Survey Controller 소프트웨어에서 데이터를 전송받아 망 조정을 수행하고자 하면 측량 작업시 그 Survey Controller 측량 스타일에 기압, 온도, 곡률 및 굴절 보정을 입력하도록 합니다

1.  기준점 데이터 가져오기

1.	프로젝트와 관련된 기준 등급의 포인트가 있으면 먼저 이들을 Trimble Geomatics Office 프로젝트에 가져옵니다. 이것은 이 기준점 좌표를 재계산의 시점으로 쓰기 위함입니다. 자세한 내용은 재계산 및 망 조정에서 좌표 균질화의 중요성을 참조하시기 바랍니다.

2. 기타 다른 데이터 집합을 모두 프로젝트에 가져와서 체크합니다. 오류 플래그는 반드시 전부 조사합니다.

참조: 데이터를 가져올 때, [중복 포인트 옵션] 대화 상자에서 '항상 중복 포인트 병합' 옵션이 선택되어 있지 않은 상태라면 중복 포인트를 병합할 필요가 있습니다.

2. 비GPS 데이터 준비

비GPS 관측치에 최소 제약 조정을 수행하려면 다음 작업을 합니다.

1.	비GPS 데이터를 가져와서 체크합니다. (발생한 오류 플래그는 모두 조사합니다.)

2.	프로젝트에 중복 포인트가 있고, [중복 포인트 옵션] 대화 상자에서 '항상 중복 포인트 병합' 옵션이 선택되어 있지 않은 상태라면 중복 포인트를 병합할 필요가 있습니다

3.	프로젝트 데이텀을 선택합니다.

4.	조정에 포함할 관측치를 [관측치] 대화 상자의 [비GPS] 탭 하에서 선택합니다.

5.	필요한 경우, 해당 데이터에 대한 관측치 그룹(분산 그룹이나 변환 그룹)을 정의합니다.

6. 가중 전략을 설정합니다. 첫 조정에 대하여 [스칼라 적용 대상]을 '모든 관측치', [스칼라 형]을 '기본값' 옵션으로 각각 설정합니다.

7.	최소 제약 조정을 수행합니다.

8. 망 조정 보고서에서 조정 내역을 봅니다.

9.	필요한 경우 스칼라 형을 '대체'로 설정한 후, 조정 결과에 만족할 때까지 조정을 계속해 갑니다.

참조: [가중 전략] 대화 상자에서 '자동' 스칼라 형 옵션을 선택했다면 카이 자승 검정에 통과할 때까지 조정 반복 연산이 계속됩니다.

10. '대체' 스칼라 옵션을 적용한 경우, [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

이제 비GPS 관측치에 대하여 완전 제약 조정을 할 준비가 되었습니다.

3.	수평 제약 조정의 수행

최소 제약 조정에서 오차 스케일링이 끝나고 나면 완전 제약 조정을 수행할 수 있습니다.

방법:

1.	프로젝트 데이텀이 아직 선택되어 있는지 확인합니다.

2.	[포인트] 대화 상자에서 기준점들을 고정합니다.

3.	조정을 수행합니다.

4.망 조정 보고서에서 조정 결과를 봅니다.

5.	필요한 경우, 조정 결과에 만족할 때까지 추가 조정을 계속해 갑니다.

팁: 조정이 수렴하지 않거나, 카이 자승 검정에 실패하거나, 또는 기준 계수가 수용 가능한 수준이 아니라면 기준점 좌표에 문제가 있을 수 있습니다. 불량 포인트를 찾을 때까지 [포인트] 대화 상자에서 포인트를 고정 해제하고(한 번에 하나씩) 완전 제약 조정을 재수행합니다. 문제점 해결에 대한 자세한 사항은 Network Adjustment User Guide를 참조하십시오.


레벨 관측치 조정하기

다음은 Trimble Geomatics Office 소프트웨어에서 레벨 관측치를 조정할 때 필요한 절차의 요약입니다.

1. 레벨 관측치 가져오기

절차:

1.	[파일 / 가져오기] 명령을 실행하여 [가져오기] 대화 상자를 불러옵니다.

2.	[측량] 탭 하에서 '디지털 레벨 파일 (*.dat, *.raw)' 옵션을 선택합니다. [열기] 대화 상자가 나옵니다.

3.	가져오고자 하는 디지털 레벨 파일을 선택합니다. [디지털 레벨 가져오기] 대화 상자가 나오면 이 레벨 관측치를 체크합니다.

4.	[확인] 단추를 누릅니다.

해당 디지털 레벨 파일이 도입됩니다.

참조: Trimble Data Exchange 포맷을 이용하여 델타 표고를 수동으로 프로젝트에 가져올 수도 있습니다.

참조: 레벨 보고서에서 레벨 정보를 보려면 [보고서 / 레벨 보고서] 명령을 실행합니다.

2. 레벨 관측치 보기

디지털 레벨 데이터는 일반적으로 표고와 관련된 수평 좌표가 없으므로 측량 보기 화면에서 볼 수 없습니다(이 포인트에 대한 수평 좌표가 이미 프로젝트에 있고 중복 포인트가 병합되지 않은 한). 하지만 등록 정보 창에서 다음 방법으로 하면 이 레벨 측량 관측치를 볼 수 있습니다.

1.	[선택 / 모두 선택] 명령을 선택합니다.

2.	다음 중 하나를 실행합니다.

  [편집 / 등록 정보] 명령을 선택합니다.

  <Alt + Enter>를 누릅니다.

  도구 모음에서 [등록 정보 창] 도구를 선택합니다.

이제 이 레벨 관측치를 볼 수 있습니다.

3.  최소 제약 조정의 수행

레벨 관측치의 조정 방법:

1.	프로젝트 데이텀을 선택합니다.

2.	망 조정 스타일을 선택합니다.

3.	조정에 포함할 관측치를 [관측치] 대화 상자에서 선택합니다.

팁: 델타 표고 관측치만 선택하려면 [관측치] 대화 상자의 필터를 이용합니다.

4.	[관측치] 대화 상자 � [지오이드] 탭에서 지오이드 관측치를 로드합니다.

5.[관측치] 대화 상자의 [비GPS] 탭에서 해당 데이터에 대한 관측치 그룹(분산 그룹이나 변환 그룹)을 정의합니다

6.	비GPS 가중 전략을 설정합니다. [가중 전략] 대화 상자에서 [비GPS] 탭을 선택한 다음, [스칼라 적용 대상]과 [스칼라 형] 상자에서 적절한 옵션을 선택합니다.

7.	[포인트] 대화 상자에서 한 포인트를 고정합니다.

참조: 일반적으로 이 포인트는 [디지털 레벨 가져오기] 대화 상자에서 표고를 정의하는 대상인 스테이션 포인트일 것입니다.

8.	최소 제약 조정을 수행합니다.

9. 망 조정 보고서에서 조정 결과를 봅니다.

10. 필요한 경우, 조정 결과에 만족할 때까지 조정을 계속해 갑니다.

11. '대체' 스칼라 옵션을 적용한 경우, [가중 전략] 대화 상자에서 그 스칼라 값을 고정합니다.

4. 완전 제약 조정의 수행

1.	프로젝트 데이텀이 아직 선택되어 있는지 확인합니다.

2.	[포인트] 대화 상자에서 기준점들을 고정합니다.

3.	완전 제약 조정을 수행합니다.

4.망 조정 보고서에서 조정 결과를 봅니다.

5.	필요한 경우, 조정 결과에 만족할 때까지 추가 조정을 계속해 갑니다.

조정이 끝나면, 조정된 좌표 집합이 각 조정 포인트에 대하여 저장됩니다. 이 좌표는 등록 정보 창에서 볼 수 있습니다.


자동 스칼라 형 이용하기

[가중 전략] 대화 상자에서 선택 가능한 스칼라 형 옵션:

  기본값

  대체

  사용자 정의

  자동

조정 작업을 시작할 때, 설정되는 기본 가중 전략은 '기본값' 스칼라 형을 '모든 관측치'에 적용하는 것입니다. 기본값 스칼라는 선험 오차를 단순히 1.00으로 곱함으로써 그 추정 오차를 변경하지 않고 그냥 둡니다.

관측치의 추정 오차가 실제 오차에 부합하는 경우, 보고서에 표시되는 기준 계수는 약 1.00이어야 합니다. 그렇지 않은 경우에는 추정 오차를 실제 오차에 부합하게 스케일링 하지 않으면 안됩니다. 가장 간단히 스칼라를 적용하는 방식은 '대체' 스칼라 형을 선택하는 것입니다. '대체' 스칼라 형은 현재 조정의 기준 계수에 이전 스칼라를 곱함으로써 그 다음 조정의 스칼라를 결정합니다. 이것은 기준 계수를 1.00에 근접하게 합니다. '대체' 스칼라 형은 카이 자승 검정을 통과할 때까지 후속 조정 반복 연산에 계속 적용됩니다. '자동' 스칼라 형 옵션은 이 과정을 자동화합니다.

 '자동' 스칼라 옵션을 선택하면 '대체' 스칼라 형을 선택하는 과정이 자동으로 됩니다. 즉, 카이 자승 검정에 통과할 때, 조정이 완료되면서 이 스칼라 값이 고정됩니다.

참조: '자동' 스칼라 형을 선택하는 경우, 망 조정 보고서는 '대체' 스칼라 형이 선택되었음을 표시합니다.

과오 탐지의 중요성

 '자동' 스칼라 형을 적용한 후, 그 조정 결과(특히 조정 히스토그램)를 세밀히 검토함으로써 과오가 관측치에 숨겨져 있지 않은지 확인합니다. 데이터 집합상의 과오(Blunder)는 망 조정의 다른 관측치(동일 그룹의)들을 과도하게 스케일링 하는 원인이 됩니다. 따라서 '자동' 스칼라 형을 적용하기에 앞서 과오가 전부 제거되었는지 확인하도록 합니다. 기본값 스칼라 옵션으로써 조정을 수행한 후, 그 결과를 검토하면 과오나 잘못된 데이터를 체크할 수 있습니다.

참조: 오류 플래그도 데이터 집합에 오류의 가능성이 있음을 나타냅니다.

'자동' 스칼라 형을 적용한 후, 그 조정 결과(특히 조정 히스토그램)를 세밀히 검토함으로써 과오가 관측치에 숨겨져 있지 않은지 확인합니다.

주의: '자동' 스칼라 형 옵션을 이용하여 GPS 관측치와 비GPS 관측치를 동시에 스케일링 하지 않도록 합니다.


    [포인트] 대화 상자 - 개요

추가 정보

방법 ...	기타
개요

이 대화 상자를 이용하여 망 조정의 포인트를 보거나 평가하고 제약합니다. [포인트] 대화 상자에서 표시되는 좌표는 등록 정보 창의 요약 페이지에서 나오는 그대로의 포인트 현재 좌표입니다. 조정 후의 좌표 값이 이 대화 상자에 표시됩니다.

참조: 어떤 포인트를 [포인트] 대화 상자에서 제약(고정)하면, 그리고 기준 등급의 좌표가 현재 없으면, 그 포인트의 좌표가 저장됩니다.

이 대화 상자를 보려면

 [조정 / 포인트] 명령을 실행합니다.

이용 가능한 옵션:

조정 데이텀

조정 데이텀이 포인트 목록 위에 나옵니다.

포인트

이 목록을 이용하여 해당 망 조정의 관측치와 연관된 포인트를 봅니다. 이 목록은 프로젝트에 포함된 포인트의 전체 목록을 반영하지 않습니다. 목록 필드에 대한 자세한 내용은 포인트 항목을 참조하십시오.

고정

해당 망 조정에 포함된 개별 포인트의 좌표 구성 요소를 제약(constrain)하려면 이 상자의 확인란을 이용합니다. 자세한 내용은 고정 항목을 참조하십시오.

좌표 보기

좌표 보기는 해당 프로젝트의 저장 좌표형을 결정합니다.

그리드 − 포인트를 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭에서 설정한 투영 좌표로 표시하고자 할 때 선택. 기본값인 옵션

로컬 − 포인트를 [프로젝트 등록 정보] 대화 상자에서 설정한 프로젝트 데이텀 지리 좌표로 표시하고자 할 때 선택

WGS − 포인트를 WGS-84 지리 좌표로 표시하고자 할 때 선택


    포인트

추가 정보

방법 ...	대화 상자	기타
개요

이 목록에는 해당 망 조정의 관측치와 관련된 포인트가 나옵니다. 프로젝트에 포함된 포인트의 전체 목록을 반영하지는 않습니다 .

목록의 행 하나당 포인트 하나에 대한 데이터가 있습니다. 그 포인트의 좌표 구성 요소를 수정하면 [고정] 상자에서 해당 '고정' 상태 확인란이 선택됩니다. 이 확인란의 '고정' 상태를 해제하는 경우, 수정된 좌표 구성 요소가 원래 좌표로 다시 변경됩니다.

팁: 목록의 열은 그 목록 내의 다른 위치로 옮길 수 있습니다. 크기를 조절함으로써 표시 정보의 양을 늘리거나 줄일 수도 있고, 오름차순/내림차순으로의 정렬도 가능합니다.

나오는 열:

열	표시 내용
포인트	망 조정 포인트의 이름
위거, 로컬 위도, WGS-84 위도	프로젝트의 도법을 기준으로 하는 포인트 위거 좌표, 또는 프로젝트 타원체(로컬 타원체)나 WGS-84 타원체 상의 포인트 위도 좌표
경거, 로컬 경도, WGS-84 경도	프로젝트의 도법을 기준으로 하는 포인트 경거 좌표, 또는 또는 프로젝트 타원체(로컬 타원체)나 WGS-84 타원체 상의 포인트 경도 좌표
고도	프로젝트 타원체(로컬 타원체)나 WGS-84 타원체를 기준으로 하는 포인트 고도. 이 값은 프로젝트 단위로 표시
표고	평균 해수면을 기준으로 하는 포인트 표고. 표고는 지오이드 분리 간격을 로드해서 적용한 후에 표시. 이 값은 프로젝트 단위로 표시
고정	포인트 위치를 구성하는 각 요소의 고정(제약) 상태. 괄호가 붙은 좌표 구성 요소 식별자나 식별자 그룹은 포인트가 기준 등급 좌표이고 고정되어 있지 않다는 것을 의미하고, 괄호가 없는 좌표 구성 요소 식별자나 식별자 그룹은 그 좌표 구성 요소가 해당 포인트에 대하여 고정되어 있음을 나타냅니다. 예를 들어, 어떤 구성 요소가 식별자 그룹 (NE, e)을 포함한다면 이것은 그 위거, 경거, 표고가 기준 등급임을 의미합니다.
[고정] 열에는 다음과 같은 고정 상태 값이 나올 수 있습니다.

고정 표시	고정되는 요소
____	포인트의 구성 요소 중 어느 것도 제약되지 않음
LL 또는 NE__	수평 위치가 제약
__h_	고도가 제약
___e	표고가 제약
LL 또는 NEh_	수평 위치와 고도가 제약
LL 또는 NE_e	수평 위치와 표고가 제약
LL 또는 NEhe	수평 위치와 고도, 표고가 제약
__he	고도와 표고가 제약

어떤 포인트의 좌표 구성 요소(2D, 고도, 표고)를 고정할 때, 그 포인트에 기준 등급 좌표가 없다면 해당 좌표는 좌표 보기에서와 같은 좌표형에 의거하여 등록 정보 창에서 업데이트 됩니다.

좌표 보기

이 단추들은 선택한 좌표계를 기준으로 하여 포인트의 수평 좌표 구성 요소를 표시합니다. 편집한 좌표의 저장 방식도 설정합니다.

그리드 − 포인트를 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭에서 설정한 투영 좌표로 표시하고자 할 때 선택. 기본값인 옵션

로컬 − 포인트를 [프로젝트 등록 정보] 대화 상자에서 설정한 프로젝트 데이텀 지리 좌표로 표시하고자 할 때 선택

WGS − 포인트를 WGS-84지리 좌표로 표시하고자 할 때 선택


    고정

추가 정보

방법 ...	대화 상자	기타
개요

이 확인란들은 포인트 좌표 구성 요소의 고정(Fix) 상태를 설정하거나 해제합니다.

좌표 구성 요소를 제약하면 그 확인란에 체크 표가 나타나고, 제약된 구성 요소가 없으면 체크 표가 표시되지 않습니다. 좌표 구성 요소는 2D(수평), 고도(타원체), 표고입니다.

이용 가능한 옵션:

2D

포인트를 위거/경거 또는 위도/경도 좌표 구성 요소로 제약하려면 이 확인란을 선택합니다.

이 옵션을 선택하는 경우, 고정 상태가 [포인트] 목록의 [고정] 열에 표시됩니다.

고도

포인트의 프로젝트 타원체 고도를 제약하려면 이 확인란을 선택합니다. 이 옵션을 선택하는 경우, 고정 상태가 [포인트] 목록의 [고정] 열에 표시됩니다.

표고

포인트의 표고를 제약하려면 이 확인란을 선택합니다. 이 옵션은 프로젝트의 관측치에 지오이드 분리 간격을 적용한 후에만 이용 가능합니다. 이 옵션을 선택하는 경우, 고정 상태가 [포인트] 목록의 [고정] 열에 표시됩니다.

참조: WGS-84 데이텀에서는 고정하는 그리드 좌표의 갯수가 하나를 넘지 않도록 합니다.

포인트 좌표 구성 요소의 제약에 대한 자세한 내용은 망 조정을 참조하십시오.


    [관측치] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

이 대화 상자에는 [GPS], [비GPS], [지오이드] 탭이 있습니다. 이 탭들을 이용하여 GPS, 비GPS, 지오이드 관측치를 망 조정에 포함/제외시키고, 그 조정의 관측 잔차를 봅니다.

[관측치] 대화 상자를 불러오려면,

  [조정 / 관측치] 명령을 실행합니다.

[GPS]와 [비GPS] 탭 하에서는 관측치의 이용 해제 설정도 할 수 있습니다. 그러면 이 관측치가 조정과 재계산에 쓰이지 않아 [관측치] 난의 목록에 나오지 않게 됩니다.

일단 관측치를 이용 해제하면 이 대화 상자에서는 이용 상태로 재설정할 수 없습니다. 자세한 사항은 관측치의 이용 해제 및 이용 해제된 관측치의 재이용을 참조하십시오.

[지오이드] 탭에서는 지오이드 분리 간격을 로드하거나 언로드 하는 작업도 할 수 있습니다.

각 탭에서 이용 가능한 옵션:

관측치

이 목록은 GPS나 비GPS, 지오이드 관측치를 표시합니다. 목록의 모양과 내용은 그 관측치에 따라 달라집니다. 각 목록에 있는 열에 대해서 자세히 살펴보려면 다음 항목들을 참조합니다.

  관측치 (GPS)

  관측치 (비GPS)

  관측치 (지오이드)

필터

이 단추를 누르면 관측치 필터링의 옵션이 있는 [관측치 필터] 대화 상자가 나옵니다. 자세한 사항은 관측치 필터링 하기를 참조하십시오.

로드 ([지오이드] 탭에서만)

지오이드 모델로부터 지오이드 분리 간격을 로드하려면 [로드] 단추를 누릅니다. 이 단추는 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭에서 지오이드 모델을 하나 선택하여야만 이용할 수 있습니다.

지오이드 모델과 각 포인트 수평 좌표를 써서 해당 지점에서의 지오이드 분리 간격을 보간 계산합니다. 각 포인트의 표고는 지오이드 분리 간격을 로드한 다음, 타원체 고도와 지오이드 분리 간격을 이용하여 얻게 됩니다. 일반적으로, 지오이드 분리 간격은 해당 지오이드 모델의 정의 데이텀을 토대로 완전 제약 조정을 함으로써 모든 포인트의 좌표를 산출한 후 로드됩니다.

자세한 사항은 지오이드 분리 간격 로드를 참조하십시오.

언로드 ([지오이드] 탭에서만)

프로젝트로부터 지오이드 분리 간격를 제거하려면 [언로드] 단추를 누릅니다. 프로젝트에서 지오이드 분리 간격을 다시 이용하려면, [로드] 단추를 써서 분리 간격을 재로드합니다. 이 단추는 [지오이드] 탭을 선택하여야만 이용할 수 있습니다.

이 단추는 프로젝트 등록 정보에서 선택한 지오이드 모델이 없거나 프로젝트에 로드된 지오이드 분리 간격이 없을 경우에는 이용할 수 없습니다.

관측치는 프로젝트에서 삭제하면 관측치 목록에서 없어집니다.

자세한 사항은 지오이드 분리 간격 언로드를 참조하십시오.


    관측치 (GPS)

추가 정보

방법 ...	대화 상자	기타
개요

이 탭 하의 관측치 목록을 이용하여:

 GPS 관측치를 포함 및 제외시킵니다.

 관측 잔차를 봅니다.

 관측치를 이용 해제합니다.

이 목록은 망 조정에 쓰인 관측치만 반영합니다. [사용] 열은 편집할 수 있지만 기타 나머지 열은 참고용일 뿐입니다.

팁: 이 목록의 관측치를 필터링 하여 RTK나 Kinematic, Static, 연속 관측치 중 어느 것이나 표시할 수 있습니다. 필터링을 하면 일시적으로 특정 관측치가 숨겨지므로 다른 관측치를 보다 쉽게 찾을 수 있게 됩니다. 자세한 사항은 관측치 필터링 하기를 참조하십시오.

나오는 열:

열	표시 내용
사용	이 열의 확인란을 선택하거나 선택 해제함으로써 관측치를 망 조정에 포함시키거나 망 조정으로부터 제외합니다. 이 열을 살펴 보면 목록에 있는 각 관측치의 현재 상태를 확인할 수 있습니다.  참조: 어떤 관측치에 커서을 두고 마우스의 오른쪽 단추를 누르면 이 관측치를 이용 해제하는 명령이 포함된 메뉴가 나옵니다. 일단 이용 해제된 관측치는 다시 이용 상태로 설정되기 전에는 관측치 목록에서 제거됨은 물론, 망 조정에도 쓰이지 않습니다. [관측치] 대화 상자에서는 이용 해제된 관측치를 다시 이용 상태로 설정할 수 없습니다. 자세한 사항은 이용 해제된 관측치의 재이용을 참조하십시오.
관측치	관측치에 지정된 레코드 번호. 레코드의 앞에 나오는 "B"는 그것이 GPS 관측치에 대한 것임을 나타냅니다.
시점	관측이 이루어진 기점
종점	관측의 대상점
종류	관측치 수집에 이용한 측량 방식. 가능한 값은 RTK, Kinematic, Static, 연속(Continuous)
분산 그룹	해당 관측치의 관련 분산 그룹(있는 경우)
표준 잔차 (최대)	해당 관측치의 표준 잔차 계산값

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


관측치 (비GPS)

추가 정보

 대화 상자

개요

이 탭 하의 관측치 목록을 이용하여:

 비GPS 관측치를 포함 및 제외시킵니다.

 관측 잔차를 봅니다.

 관측치를 이용 해제합니다.

[사용] 열은 편집할 수 있지만 기타 나머지 열은 볼 수만 있습니다.

팁: 이 목록의 관측치를 필터링 하여 방위각이나 수평각, 타원체 거리, 델타 표고, 삼각 표고 관측치 중 어느 것이나 표시할 수 있습니다. 필터링을 하면 일시적으로 특정 관측치가 숨겨지므로 다른 관측치를 보다 쉽게 찾을 수 있게 됩니다.

비GPS  관측치 필터의 경우, 선택하고자 하는 종류의 관측치에 대하여 확신을 하지 못하는 한, 관측치의 모두를 선택 상태 그대로 두도록 합니다. 하나의 옵션을 선택하면 부분적인 관측치를 선택하는 것과 동일합니다.

예를 들어, 타원체 거리 필터를 선택하면 타원체 거리가 포함된 관측치만 보게 됩니다. 다시 말해, 수평각과 타원체 거리가 같이 있는 관측치는 이 두 필터 옵션을 동시에 선택하지 않는 한, 얻지 못하게 됩니다

  [방위각] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 키입력된 방위각이 있는 관측치만 표시되게 됩니다.

  [델타 표고] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 레벨 데이터가 선택되게 됩니다.

  원시 관측치를 보고자 하면 [수평각], [타원체 거리], [삼각 표고] 확인란을 선택합니다

나오는 열:

열	표시 내용
사용	이 열의 확인란을 선택하거나 선택 해제함으로써 관측치를 망 조정에 포함시키거나 망 조정으로부터 제외합니다. 이 열을 살펴 보면 목록에 있는 각 관측치의 현재 상태를 확인할 수 있습니다.  참조: 어떤 관측치에 커서을 두고 마우스의 오른쪽 단추를 누르면 이 관측치를 이용 해제하는 명령이 포함된 메뉴가 나옵니다. 일단 이용 해제된 관측치는 다시 이용 상태로 설정되기 전에는 관측치 목록에서 제거됨은 물론, 망 조정에도 쓰이지 않습니다. [관측치] 대화 상자에서는 이용 해제된 관측치를 다시 이용 상태로 설정할 수 없습니다. 자세한 사항은 이용 해제된 관측치의 재이용을 참조하십시오.
관측치	관측치에 지정된 레코드 번호. 레코드의 앞에 나오는 "T"는 그것이 비GPS 관측치에 대한 것임을 나타냅니다.
후시점	후시점의 이름
기계점	기계점의 이름
전시점	전시점의 이름
분산 그룹	해당 관측치의 관련 분산 그룹
표준 잔차 (최대)	해당 관측치의 표준 잔차 계산값

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.

참조: 레벨 관측치와 방위각 관측치는 비GPS 관측치로 취급됩니다. 이들의 경우에는 '기계점'은 '시점', '전시점'은 '종점'으로 생각하도록 합니다.


    관측치 (지오이드)

추가 정보

방법 ...	대화 상자	기타
개요

이 탭 하의 관측치 목록을 이용하여 지오이드 관측치를 봅니다. [사용] 열은 편집할 수 있지만 기타 나머지 열은 볼 수만 있습니다.

지오이드 분리 간격은 망 조정의 모든 포인트에 대하여 지오이드 모델로부터 계산합니다.

나오는 열:

열	표시 내용
사용	이 열의 확인란을 선택하거나 선택 해제함으로써 관측치를 망 조정에 포함시키거나 망 조정으로부터 제외합니다. 이 열을 살펴 보면 목록에 있는 각 관측치의 현재 상태를 결정할 수 있습니다.
관측치	관측치에 지정된 레코드 번호. 레코드의 앞에 나오는 "G"는 그것이 지오이드 관측치에 대한 것임을 나타냅니다.
포인트	지오이드 관측을 한 포인트의 이름
분리 간격	고도(타원체)와 표고(지오이드)와의 차이
오차	지오이드 관측치의 표준 오차. 이것은 지오이드 관측치를 로드할 때 계산됩니다. 이 표준 오차를 덮어쓰려면 [망 조정 스타일] 대화 상자에서 최소 표준 오차를 설정합니다.
분산 그룹	해당 관측치의 관련 분산 그룹 이름. 지오이드 관측치는 이 열에서 <지오이드 기본값 > 분산 그룹만 나열합니다.
표준 잔차	해당 관측치의 표준 잔차 계산값

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    [관측치 필터] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

이 대화 상자를 이용하여 [이용 가능 관측치] 목록에 나오는 관측치 종류를 필터링 합니다.

[관측치 필터] 대화 상자를 보려면:

 [이용 가능 관측치] 목록이 있는 아무 대화 상자에서나 [필터] 단추를 누릅니다.

기본값으로, 필터가 전부 활성화되므로 모든 관측치 종류가 표시됩니다. 선택을 해제하면 해당되는 각 필터가 기능을 하지 않게 됩니다. 다음 표는 이용 가능한 옵션을 보여줍니다.

비GPS  관측치 필터의 경우, 선택하고자 하는 종류의 관측치에 대하여 확신을 하지 못하는 한, 관측치의 모두를 선택 상태 그대로 두도록 합니다. 하나의 옵션을 선택하면 부분적인 관측치를 선택하는 것과 동일합니다. 예를 들어, 타원체 거리 필터를 선택하면 타원체 거리가 포함된 관측치만 보게 됩니다. 다시 말해, 수평각과 타원체 거리가 같이 있는 관측치는 이 두 필터 옵션을 동시에 선택하지 않는 한, 얻지 못하게 됩니다.

  [방위각] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 키입력된 방위각이 있는 관측치만 표시되게 됩니다.

  [델타 표고] 확인란은 선택하고 기타 다른 관측치의 확인란은 선택 해제하면 레벨 데이터가 선택되게 됩니다.

  원시 관측치를 보고자 하면 [수평각], [타원체 거리], [삼각 표고] 확인란을 선택합니다.


    [분산 그룹] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

[분산 그룹] 대화 상자에는 [GPS], [비GPS], [지오이드] 탭이 있습니다. 이 탭들을 이용하여 GPS 관측치와 비GPS 관측치의 분산 그룹을 보거나 만들고 편집, 삭제합니다. 또는 지오이드 분리 간격의 기본 분산 그룹을 봅니다.

이 대화 상자를 불러오려면

  [조정 / 관측치 그룹 / 분산 그룹] 명령을 실행합니다.

각 탭에는 다음과 같은 옵션이 있습니다.

그룹

어떤 분산 그룹을 편집하거나 삭제하려면 이 목록에서 해당 그룹을 선택합니다. 새로 만든 분산 그룹은 이 목록에 추가되게 됩니다.

[GPS] 탭를 선택하면 GPS 관측치의 분산 그룹이 표시되고 [비GPS] 탭를 선택하면 비GPS 관측치의 분산 그룹이 나옵니다. 지오이드 분산 그룹은 [지오이드] 탭 하에서 볼 수 있습니다.

참조: 처음에 <지오이드 기본값> 그룹은 관측치가 들어 있지 않습니다. 지오이드 모델을 프로젝트 등록 정보에서 정의하고 지오이드 분리 간격을 프로젝트에 로드하게 되면 관측치가 나옵니다.

새로 만들기

프로젝트에 대한 새 분산 그룹을 만들 때 이 단추를 씁니다.

[새로 만들기] 단추를 선택하면 [새 분산 그룹] 대화 상자가 나오는데 새 이름을 부여하는 옵션이 있습니다. [확인]을 눌러 [분산 그룹 편집] 대화 상자가 나오면 GPS 관측치나 비GPS 관측치를  이 그룹에 추가할 수 있습니다. 이 단추는 <지오이드 기본값> 분산 그룹을 볼 때에는 이용할 수 없습니다.

편집

[그룹] 목록에서 선택한 기존의 분산 그룹을 편집할 경우 이 단추를 누릅니다. 선택한 그룹이 [분산 그룹 편집] 대화 상자에 로드되는데, 이 때 개별 관측치를 추가하거나 삭제할 수 있습니다.

GPS 분산 그룹과 비GPS 분산 그룹은 어느 것이나 편집할 수 있지만 지오이드 분산 그룹은 볼 수만 있습니다.

삭제

[그룹] 목록에서 선택한 기존의 분산 그룹을 삭제할 경우 이 단추를 누릅니다 .

삭제 의사 여부를 확인하는 메시지가 나오게 되는데, [확인]을 누르면 명령이 수행되고 [취소]를 누르면 명령 수행이 중단됩니다.

참조: <GPS 기본값>이나 <비GPS 기본값>, <지오이드 기본값>의 분산 그룹은 삭제할 수 없습니다.

참조: 아주 짧은 선(25 m 미만) 상의 관측치에 대해서는 별도의 분산 그룹을 만듬으로써 다른 관측치와는 분리하여 스케일링을 합니다.


    [분산 그룹 편집] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

[분산 그룹 편집] 대화 상자에는 [GPS], [비GPS], [지오이드] 탭이 있습니다. 이 탭들을 이용하여 분산 그룹과 GPS 관측치, 비GPS 관측치, 지오이드 분리 간격을 보거나 편집합니다. 분산 그룹에 대한 편집은 관측치를 추가하고 제거하는 과정입니다.

이 대화 상자를 불러오려면:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행합니다. [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS]나 [비GPS], [지오이드] 탭을 누릅니다.

3.	원하는 그룹을 선택합니다.

4.	[편집]을 누릅니다.

[분산 그룹 편집] 대화 상자가 나옵니다. 자세한 내용은 분산 그룹 편집하기를 참조하십시오.

각 탭에는 다음과 같은 옵션이 있습니다.

그룹 이름

분산 그룹에 지정된 이름을 찾으려면 이 필드를 봅니다. 이 필드는 참고용이므로 편집할 수 없습니다.

그룹 관측치

이 목록을 모니터하여 분산 그룹에 있는 관측치를 봅니다. 목록은 GPS 관측치와 비GPS 관측치, 지오이드 분리 간격 관측치에 각 하나씩 전부 3가지가 있습니다. 각 목록의 열에 대한 자세한 내용은 다음 항목을 참조하십시오.

  그룹 관측치 (GPS)

  그룹 관측치 (비GPS)

  그룹 관측치 (지오이드)

이용 가능 관측치

이 목록을 모니터하여 망 조정에 포함된 GPS 관측치를 모두 봅니다. 이 목록에서 관측치를 선택하여 분산 그룹에 추가할 수도 있습니다. 모든 필드는 참고용이므로 편집할 수 없습니다.

  이용 가능 관측치 (GPS)

  이용 가능 관측치 (비GPS)

  이용 가능 관측치 (지오이드)

참조: [이용 가능 관측치] 목록은 <지오이드 기본값> 분산 그룹의 편집시 표시는 되지만 활성화되지 않습니다.

추가

분산 그룹에 관측치를 추가할 때 쓰는 단추입니다. 이 단추는 [이용 가능 관측치] 목록에서 어떤 관측치를 선택한 경우에만 활성화 됩니다. 자세한 내용은 관측치 추가하기를 참조하십시오.

제거

관측치를 분산 그룹으로부터 제거할 때 쓰는 단추입니다. 이 단추는 [이용 가능 관측치] 목록에서 어떤 관측치를 선택한 경우에만 활성화 됩니다. 또한 이 단추는 기본 분산 그룹들이 아니라 사용자 정의 분산 그룹을 편집할 때에만 이용할 수 있습니다. 자세한 내용은 관측치 제거하기를 참조하십시오.

필터

[이용 가능 관측치] 목록의 관측치를 필터링 하고자 할 때 이 단추를 씁니다.

[관측치 필터] 대화 상자에는 목록의 관측치들을 필터링 하는 옵션이 몇가지 있습니다.

GPS 관측치에 대한 [분산 그룹 편집] 대화 상자에서 옵션을 적절히 선택하면 RTK, Kinematic, Static, 연속 등의 관측치 종류 중 어느 것이나 표시하거나 숨길 수 있습니다. 비GPS 관측치에 대한 [분산 그룹 편집] 대화 상자에서 옵션을 적절히 선택하면 방위각, 수평각, 타원체 거리, 델타 표고, 삼각 관측치 중 원하는 것을 모두 표시하거나 숨길 수 있습니다.

자세한 내용은 관측치 필터링 하기를 참조하십시오.


    그룹 관측치 (분산 그룹 - GPS)

추가 정보

방법 ...	대화 상자	기타
개요

이 목록을 이용하여 분산 그룹의 관측치를 봅니다. 이 형태의 목록은 GPS 관측치의 분산 그룹에 대해서만 나옵니다.

관측치는 이 목록에 추가하고 제거할 수 있습니다. 모든 필드는 참고용이므로 편집할 수 없습니다. 목록의 어떤 관측치를 하이라이트 하면 [제거] 단추가 활성화되는데, 이 단추를 이용하여 목록에서 그 관측치를 제거할 수 있습니다. 자세한 내용은 관측치 추가하기와 관측치 제거하기를 참조하십시오.

나오는 열:

열	표시 내용
관측치	프로젝트의 관측치에 지정된 레코드 번호
시점	관측이 이루어진 기점
종점	관측의 대상점
종류	관측치 수집에 이용한 측량 방식. 가능한 값은 RTK, Kinematic, Static, 연속(Continuous)

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    이용 가능 관측치 (분산 그룹 - GPS)

추가 정보

방법 ...	대화 상자	기타
개요

망 조정에 포함된 GPS 관측치가 모두 이 목록에 나옵니다. 관측치는 이 목록에서 선택하여 분산 그룹에 추가할 수 있습니다. 모든 필드는 참고용이므로 편집할 수 없습니다 .

목록의 각 행은 관측치 하나의 분산 그룹 정보를 나타냅니다. 이 목록을 토대로 해서 관측치를 분산 그룹에 추가하도록 합니다. 목록의 어떤 관측치를 선택하면 [추가] 단추가 활성화되는데, 이를 이용하여 그룹 관측치 목록에 관측치를 추가할 수 있습니다

팁: [필터] 단추를 이용하면 RTK, Kinematic, Static, 연속 등의 관측치 중 어느 것이나 표시하거나 숨길 수 있습니다. 필터링을 하면 일시적으로 특정 관측치가 숨져지므로 다른 관측치를 보다 쉽게 찾을 수 있게 됩니다. 자세한 사항은 관측치 필터링 하기 를 참조하십시오

나오는 열:

열	표시 내용
관측치	프로젝트의 관측치에 지정된 레코드 번호
시점	관측이 이루어진 기점
종점	관측의 대상점
종류	관측치 수집에 이용한 GPS 측량 방식. 가능한 값은 RTK, Kinematic, Static, 연속(Continuous)
분산 그룹	분산 그룹에 지정된 관측치가 있는지 여부

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    그룹 관측치 (분산 그룹 - 지오이드)

추가 정보

방법 ...	대화 상자	기타
개요

목록의 각 행은 프로젝트에 저장된 관측치 레코드입니다. 어느 필드도 편집을 할 수 없습니다.

나오는 열:

열	표시 내용
관측치	프로젝트의 저장  관측치 데이터에 지정된 레코드 번호
포인트	지오이드 모델에서 지오이드 관측치를 추출함에 이용한 좌표점의 이름
분리 간격	지오이드 모델(프로젝트 등록 정보에서 정의한)로부터 도출한 지오이드 관측치의 고도
오차	지오이드 분리 간격의 추정 오차

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    이용 가능 관측치 (분산 그룹 - 지오이드)

추가 정보

 기타

개요

[이용 가능 관측치] 목록이 해제되므로 이용하지 못합니다.


    [새 분산 그룹] 대화 상자

추가 정보

방법 ...	대화 상자	기타
개요

새로운 분산 그룹을 만드는 대화 상자입니다.

참조: [지오이드] 탭 하에서는 이 단추를 이용하지 못합니다. 동일한 지오이드 모델로부터 각각의 지오이드 관측치를 보간할 때 쓰는 방식이 동일하기 때문에 이들을 여러 개의 그룹으로 분리할 필요가 없습니다.

이 대화 상자를 불러오려면:

1.	[조정 / 관측치 그룹 / 분산 그룹] 명령을 실행하면 [분산 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	[새로 만들기] 단추를 누릅니다.

[새 분산 그룹] 대화 상자가 나옵니다.

다음과 같은 옵션이 있습니다.

이름

분산 그룹의 이름을 이 필드에 입력합니다. 이름은 최고 24 개까지의 문자를 쓸 수 있는데, 짧은 설명 형식으로 해야 [그룹] 목록에서 찾기 편리합니다.

새 분산 그룹의 이름을 붙인 후, [확인]을 누르면 [분산 그룹 편집] 대화 상자가 나오는데, 여기서 분산 그룹의 추가 및 제거 작업을 할 수 있습니다. 자세한 내용은 분산 그룹 만들기를 참조하십시오.


그룹 관측치 (분산 그룹 - 비GPS)

개요

이 [그룹] 목록에서 분산 그룹의 관측치를 봅니다. 이 형태의 목록은 비GPS 관측치의 분산 그룹에 대해서만 나옵니다.

팁: 관측치를 목록에서 제거하거나 목록에 추가할 수는 있지만 (목록의 어떤 관측치를 하이라이트 하면 [제거] 단추가 활성화됨), 어느 필드도 편집할 수는 없습니다. 자세한 내용은 관측치 추가하기와 관측치 제거하기를 참조하십시오

나오는 열:

열	표시 내용
관측치	프로젝트의 관측치에 지정된 레코드 번호
후시점	관측 후시점의 이름
기계점	관측 기계점의 이름
전시점	관측 전시점의 이름

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.

참조: 레벨 관측치와 방위각 관측치는 비GPS 관측치로 취급됩니다. 이들의 경우에는 '기계점'은 '시점', '전시점'은 '종점'으로 생각하도록 합니다

참조: 비GPS 분산 그룹을 만들 때 각 관측치 종류별로 별개의 그룹이 만들어집니다. 예를 들어, 수직각과 거리 관측치를 포함하는 비GPS 분산 그룹을 만들 경우, 각도 관측치와 거리 관측치에 대하여 비GPS 분산 그룹이 각각 하나씩 만들어집니다. <비GPS 기본값> 분산 그룹에 대해서도 마찬가지입니다.


이용 가능 관측치 (분산 그룹 - 비GPS)

개요

망 조정에 포함된 비GPS 관측치가 모두 [그룹] 목록에 나옵니다. 각 행은 관측치 하나의 분산 그룹 정보를 나타냅니다. 관측치를 목록에서 선택하여 분산 그룹에 추가할 수는 있지만 어느 필드도 편집할 수는 없습니다.

목록의 어떤 관측치를 선택하면 [추가] 단추가 활성화되는데, 이를 이용하여 관측치를 그룹 관측치의 목록에 추가할 수 있습니다.

팁: [필터] 단추를 이용하면 관측치를 선별하여 방위각, 수평각, 타원체 거리, 델타 표고, 삼각 표고 중 어느 것이나 표시할 수 있습니다. 필터링을 하면 일시적으로 특정 관측치가 숨져지므로 다른 관측치를 보다 쉽게 찾을 수 있게 됩니다. 자세한 사항은 관측치 필터링 하기 를 참조하십시오.

나오는 열:

열	표시 내용
관측치	프로젝트의 관측치에 지정된 레코드 번호
후시점	관측 후시점 이름
기계점	관측 기계점 이름
전시점	관측 전시점 이름
분산 그룹	분산 그룹에 지정된 관측치가 있는지 여부

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    [변환 그룹] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

망 조정에 대한 변환 그룹을 만들고 편집, 삭제하는 대화 상자입니다. [변환 그룹] 대화 상자에는 [GPS], [비GPS], [지오이드] 탭이 있습니다. 이 탭들을 이용하여 GPS 관측치와 비GPS 관측치, 지오이드 관측치의 변환 그룹을 보거나 선택합니다.

이 대화 상자를 불러오려면

  [조정 / 관측치 그룹 / 변환 그룹] 명령을 실행합니다.

각 탭에는 다음과 같은 옵션이 있습니다.

그룹

이 목록을 이용하여 GPS 관측치나 비GPS 관측치, 지오이드 관측치의 변환 그룹을 선택합니다.

[그룹] 목록의 내용은 선택하는 탭 여하에 따라 달라집니다.

3개의 기본 변환 그룹(<GPS 기본값> 그룹, <비GPS 기본값> 그룹, <지오이드 기본값> 그룹)이 자동으로 만들어집니다. <지오이드 기본값> 그룹은 비어 있을 수도 있고, 지오이드 분리 간격 데이터가 있는 관측치가 모두 들어 있을 수도 있습니다.

참조: 프로젝트에 정의된 지오이드 모델이 없거나, 지오이드 모델 분리 간격을 프로젝트에 로드하지 않은 경우에는 <지오이드 기본값> 그룹이 비어 있습니다. 프로젝트에 지오이드 모델을 정의하는 것과 관련, 자세한 사항은 좌표계 를 참조하십시오. 망 조정에 쓰고자 지오이드 모델로부터 지오이드 분리 간격을 로드하는 것과 관련, 자세한 내용은 관측치를 참조합니다.

[GPS] 탭 하에서는 <GPS 기본값> 그룹 및 기타 모든 사용자 정의 GPS 그룹의 목록이 나오고, [비GPS] 탭 하에서는 <비GPS 기본값> 그룹 및 기타 모든 사용자 정의 비GPS 그룹의 목록이 나옵니다. 하지만 [지오이드] 탭 하에서는 <지오이드 기본값> 그룹만 나옵니다. 지오이드 그룹은 새로 만들 수 없기 때문입니다.

원할 경우, 목록에서 변환 그룹을 하나 선택한 후, 해당 단추를 눌러 그 그룹을 삭제하거나 편집할 수 있습니다.

새로 만들기

이 단추는 변환 그룹을 새로 만들 때 쓰는데, 지오이드 변환 그룹에 대해서는 이용하지 못합니다.

참조: <GPS 기본값>이나 <비GPS 기본값>, <지오이드 기본값> 그룹은 절대로 삭제할 수 없습니다. <지오이드 기본값> 변환 그룹은 하나 밖에 없는 지오이드 변환 그룹입니다. 지오이드 관측치는 단 하나의 대상(즉, 지오이드 모델)에서 나오기 때문에 여러 개의 지오이드 변환 그룹이 있을 필요가 없습니다. <지오이드 기본값> 그룹의 경우, 수정 가능한 것은 그 변환 매개 변수뿐입니다.

자세한 내용은 변환 그룹 만들기를 참조합니다.

편집

이 단추는 변환 그룹(GPS, 비GPS, 지오이드)을 보거나 편집하고자 할 경우 선택하는데 GPS나 비GPS, 지오이드 그룹의 목록이 나와 있을 때 항상 이용할 수 있습니다.

[변환 그룹 편집] 대화 상자의 옵션을 이용하여 그룹 관측치(GPS 및 비GPS만)를 추가 또는 제거하고 변환 매개 변수를 수정할 수 있습니다.

자세한 사항은 변환 그룹 편집하기를 참조하십시오.

삭제

선택한 GPS 변환 그룹이나 비GPS 변환 그룹을 삭제하는 단추입니다. 프로젝트에서 <GPS 기본값>이나 <비GPS 기본값>, <지오이드 기본값> 그룹은 절대로 삭제할 수 없고, 사용자 정의의 변환 그룹(GPS 나 비GPS)만 삭제 가능합니다.

참조: <지오이드 기본값> 그룹은 삭제하지 못합니다. 새 지오이드 변환 그룹을 만들지도 못하므로 지오이드 변환 그룹의 경우에는 전혀 이 단추를 이용할 수 없습니다.

자세한 내용은 변환 그룹 삭제하기를 참조하도록 합니다.


    [새 변환 그룹] 대화 상자

추가 정보

방법 ...	대화 상자	기타
개요

새로운 변환 그룹(GPS나 비GPS)을 만드는 대화 상자입니다.

참조: [지오이드] 탭 하에서는 이 단추를 이용하지 못합니다. 동일한 지오이드 모델로부터 각각의 지오이드 관측치를 보간할 때 쓰는 방식이 동일하므로 이들을 여러 개의 그룹으로 분리할 필요가 없습니다.

이 대화 상자를 불러오려면:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭을 선택합니다.

3.	[새로 만들기] 단추를 누릅니다.

[새 변환 그룹] 대화 상자가 나옵니다.

옵션:

이름

변환 그룹의 이름을 이 필드에 입력합니다. 이름은 최고 24 개까지의 문자를 쓸 수 있는데, 짧은 설명 형식으로 해야 [그룹] 목록에서 찾기 편리합니다.

새 변환 그룹의 이름을 붙인 후, [확인]을 누르면 [변환 그룹 편집] 대화 상자가 나오는데, 여기서 변환 그룹 관측치를 추가, 제거하거나 변환 매개 변수를 정의할 수 있습니다. 자세한 내용은 변환 그룹 만들기를 참조하십시오.


    [변환 그룹 편집] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

GPS 관측치나 비GPS 관측치, 지오이드 관측치의 변환 그룹을 보거나 편집, 확인하는 대화 상자입니다.

이 대화 상자를 불러오려면:

1.	[조정 / 관측치 그룹 / 변환 그룹] 명령을 실행하면 [변환 그룹] 대화 상자가 나옵니다.

2.	[GPS] 탭이나 [비GPS] 탭, [지오이드] 탭 하에서 해당 그룹을 선택합니다.

3.	[편집] 단추를 누릅니다.

[변환 그룹 편집] 대화 상자가 나옵니다. 자세한 사항은 변환 그룹 편집하기를 참조합니다.

GPS와 비GPS 분산 그룹에 대한 편집은 망 조정 관측치를 그룹에 추가하거나 제거하고, 변환 매개 변수를 정의하는 과정입니다. 지오이드 변환 그룹의 경우에는 망 조정의 모든 이용 관측치(지오이드 모델 분리 간격이 있음)를 포함하기 때문에 편집 작업은 변환 매개 변수 정의에 국한됩니다.

참조: 프로젝트에 정의된 지오이드 모델이 없거나, 지오이드 모델 분리 간격을 프로젝트에 로드하지 않은 경우에는 <지오이드 기본값> 그룹이 비어 있습니다. 프로젝트에 지오이드 모델을 정의하는 것과 관련, 자세한 사항은 좌표계를 참조하십시오. 지오이드 모델로부터 지오이드 분리 간격을 로드하는 것과 관련, 자세한 내용은 관측치를 참조합니다.

변환 그룹의 관측치에 적용하기 위한 변환 매개 변수는 어떠한 조합으로라도 정의하거나 계산할 수 있습니다. 복수의 GPS 변환 그룹이나 비GPS 변환 그룹을 만들어 이들 각 그룹에 서로 다른 세트의 변환 매개 변수를 적용할 수 있습니다.

주의: 부적절한 변환을 적용하면 망 조정에 나쁜 영향을 끼칠 수 있습니다. 모든 변환 매개 변수는 관측치 그룹의 변환 작업에 앞서 검토, 확인하여야 합니다.

이용 가능한 옵션:

그룹 이름

변환 그룹에 지정된 이름이 나옵니다.  이 필드는 참고용이므로 편집할 수 없습니다.

변환 매개 변수 목록

이 목록을 이용하여 변환 매개 변수를 정의하거나 계산, 제외합니다.

정의하거나 계산할 수 있는 매개 변수:

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수

각 매개 변수의 정의에는 [값] 필드와 [상태] 목록이 들어 있습니다. 자세한 내용은 다음 항목을 참조하십시오.

  값

  상태

기본값으로, 다음 변환 매개 변수들은 GPS 관측치의 변환 그룹에 대하여 '계산'으로 설정됩니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

기본값으로, 방위각 회전만이 비GPS 관측치에 대하여 '계산'으로 설정됩니다. 기타 매개 변수는 '사용자 정의'나 '계산'으로 설정될 수 있지만 관측치에 정오차가 있는 경우에만 쓰도록 합니다. 예를 들어, 조정 후의 모든 거리(비GPS 방식으로 측정)에 공히 +3 ppm 잔차가 있다면 데이터 수집 도중 명백히 정오차가 발생한 것이므로 거리 축척 매개 변수가 계산될 수 있습니다. 이 정오차는 EDM의 ppm 설정이 적용되지 않았기 때문에 발생하였을 가능성이 있습니다.

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드 변환에 사용되지 않습니다.

개별 변환 매개 변수나 매개 변수 집합의 정의에 대한 기본 지침은 변환 매개 변수를 참조하십시오. 관측 데이터의 변환과 관련, 보다 전문적인 정보를 알고 싶으신 분은 참고 문헌을 참조하십시오.

그룹 관측치

이 목록은 변환 그룹에 포함된 GPS나 비GPS, 지오이드의 관측치가 나옵니다. 이 목록의 내용은 관측치의 종류 여하에 따라 달라집니다.

자세한 내용은 다음 항목을 참조하십시오.

  그룹 관측치 (GPS)

  그룹 관측치 (비GPS)

  그룹 관측치 (지오이드)

이용 가능 관측치

이 목록을 이용하여 망 조정의 모든 관측치를 봅니다. 이 목록에서 관측치를 선택하여 변환 그룹에 추가할 수도 있습니다. 모든 필드는 보기용이므로 편집할 수 없습니다.

이 목록의 필드들에 대한 자세한 사항은 다음 항목을 참조하십시오.

  이용 가능 관측치 (GPS)

  이용 가능 관측치 (비GPS)

  이용 가능 관측치 (지오이드)

참조: [이용 가능 관측치] 목록은 <GPS 기본값>이나 <비GPS 기본값>, <지오이드 기본값> 변환 그룹의 편집시 표시는 되지만 활성화되지 않습니다. 기본값 변환 그룹(GPS, 비GPS, 지오이드)에서 관측치를 제거할 수 없습니다.

추가

관측치를 [그룹 관측치] 목록에 추가할 때 쓰는 단추입니다. 이 단추는 [이용 가능 관측치] 목록에서 어떤 관측치를 선택한 경우에만 활성화 됩니다.

제거

관측치를 [그룹 관측치] 목록에서 제거할 때 쓰는 단추입니다.

필터

[관측치 필터] 대화 상자를 불러와 [이용 가능 관측치] 목록의 관측치 종류를 필터링 하고자 할 때 이 단추를 씁니다 .


    값 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[변환 매개 변수] 목록의 두번째 열에 있는 필드들을 이용하여 각 변환 매개 변수에 적용되는 값을 보거나 변경합니다.

이 필드는 변환 매개 변수의 값을 명시합니다.  이 값은 상태 목록에서 선택한 옵션 여하에 따라 생성되기도 하고 생성되지 않기도 합니다.

개별 매개 변수에 대한 값과 상태의 변경 지침은 다음 항목을 참조합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수


    상태 (변환 매개 변수)

추가 정보

대화 상자	기타
개요

[변환 매개 변수] 목록의 세번째 열에 있는 필드들을 이용하여 변환 매개 변수 값의 결정 방법을 선택합니다.

이용 가능한 옵션:

계산

이 옵션을 택하면 Trimble Geomatics Office 소프트웨어가 조정의 일환으로서 변환 매개 변수의 값을 계산해 냅니다. 망 조정에 고정 포인트 제약 조건(좌표 구성 요소에 고정된 포인트)이 충분히 포함되어 있을 때, 목록의 각 매개 변수에 대한 값이 계산됩니다. 좌표 제약에 대한 자세한 내용은 포인트를 참조하십시오.

사용자 정의

사용자 정의의 변환 매개 변수 값을 입력하고자 하면 이 옵션을 선택합니다. 매개 변수 값이 알려져 있으면 이 '사용자 정의' 옵션이 선택되고, 그 알려진 값이 관련 [값] 필드에 입력됩니다.

주의: 매개 변수의 상태를 '사용자 정의'로 설정하고 사용자 자신의 값을 입력할 경우에는 주의를 요합니다. 개별 매개 변수의 값과 상태를 정의하는 것과 관련, 자세한 내용은 변환 매개 변수를 참조하십시오.

미사용

변환 매개 변수의 값을 해제하는 옵션입니다. [값] 필드에 어떤 값이 입력되어 있을 경우에 이 옵션을 택하면 그 값이 이용 해제됩니다. 이용 해제된 매개 변수 값은 해당 변환 그룹의 관측치에 계산되거나 적용되지 않습니다. 이 옵션은 모든 매개 변수의 기본값 설정입니다.

주의: 변환 매개 변수 값에 대한 [상태] 옵션의 선택시에는 주의를 요합니다. 부적절한 변환 매개 변수 값을 적용하면 망 조정에 나쁜 영향을 끼칠 수 있습니다.

개별 매개 변수에 대한 [상태] 옵션의 선택 지침은 다음 항목을 보도록 합니다.

  경도 편향

  위도 편향

  방위각 회전

  망 축척

  거리 축척

  거리 상수

  고도 상수


    경도 편향 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

 [값] 필드와 [상태] 필드를 이용하여 로컬 측지 평면의 동서 방향 기울기(seconds of arc 단위)를 보거나 확인, 입력합니다.

경도 편향(Longitude Deflection)은 데이텀 변환에 쓰는 회전각입니다. 관측 천문 방위각의 Laplace 보정 계산에 쓰이는 경우(비GPS 관측치)도 있습니다. 이 회전각을 이용하는 경우, 알려진(반드시 고정된 것은 아님) 수평 위치에 고정되는 높이값(표고나 타원체 고도)이 3개 필요합니다. 이 각은 각도 관측치 및 선형 관측치, 수평 관측치(델타 표고 제외), 수직 관측치에 영향을 미치는데, 연직선 편차(Deflection of the vertical)의 한 구성 요소에 해당합니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    위도 편향 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[값] 필드와 [상태] 필드를 이용하여 로컬 측지 평면의 남북 방향 기울기(seconds of arc 단위)를 보거나 확인, 정의합니다.

위도 편향(Latitude Deflection)은 데이텀 변환에 쓰는 회전각의 하나입니다. 이 회전각을 이용하는 경우, 알려진(반드시 고정된 것은 아님) 수평 위치에 고정되는 높이값(표고나 타원체 고도)이 3개 필요합니다. 이 각은 각도 관측치 및 선형 관측치, 수평 관측치(델타 표고 제외), 수직 관측치에 영향을 미치는데, 연직선 편차(Deflection of the vertical)의 한 구성 요소에 해당합니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    방위각 회전 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[값] 필드와 [상태] 필드를 이용하여, 모든 포인트에서의 법선(그 포인트에서 타원체면과 수직을 이루는 직선)을 기준으로 한 좌표계 회전도(조정 데이텀 대 관측 데이텀간의 회전도를 설명하며 seconds of arc 단위로 표시)를 보거나 확인, 계산, 입력합니다. 방위각 회전은 데이텀 변환에 쓰이는데 키입력 방위각에만 영향을 미칩니다.

GPS 관측치에 대한 방위각 회전도의 계산에는 2개의 고정 수평 포인트가 필요합니다. 비GPS 관측치는 GPS 방위각에 맞추어지게끔 회전을 합니다(기본값임).

기본값으로, 방위각 회전만이 비GPS 관측치에 대하여 '계산'으로 설정됩니다. 기타 매개 변수는 '사용자 정의'나 '계산'으로 설정될 수 있지만 관측치에 정오차가 있는 경우에만 쓰도록 합니다. 예를 들어, 조정 후의 모든 거리(비GPS 방식으로 측정)에 공히 +3 ppm 잔차가 있다면 데이터 수집 도중 명백히 정오차가 발생한 것이므로 거리 축척 매개 변수가 계산될 수 있습니다. 이 정오차는 EDM의 ppm 설정이 적용되지 않았기 때문에 발생하였을 가능성이 있습니다.

참조: 방위각 회전 매개 변수는 지오이드 변환에 사용되지 않습니다.

참조: 이 회전은 망 조정 관측치에만 적용됩니다. 예를 들어, 사이드샷 관측치는 조정에 포함되지 않으므로 회전되지 않습니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    망 축척 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[값] 필드와 [상태] 필드를 이용하여 망 조정의 모든 선형 관측치에 적용할 망 축척 승수를 보거나 확인, 입력합니다. 망 축척은 관측치 집합을 한 데이텀에서 다른 데이텀으로 변환함에 이용합니다.

GPS 관측치에 대한 망 축척의 계산에는 2개의 고정 수평 포인트와 1개의 고정 수직 포인트가 필요합니다.

비GPS 관측치에 대한 망 축척의 계산에는 2개의 고정 수평 포인트나 수직 포인트가 필요합니다.

망 축척은 변환 그룹의 모든 선형 GPS 관측치에 적용됩니다.

참조: 망 축척 매개 변수는 지오이드 변환에 사용되지 않습니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    거리 축척 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[값] 필드와 [상태] 필드를 이용하여 이 매개 변수 그룹의 모든 거리 관측치에 적용되는 거리 축척 승수를 보거나 확인, 입력합니다.

거리 축척은 데이텀 변환에 쓰이는 매개 변수인데 관측치의 정오차 보정에 쓰이는 경우도 있습니다. 이 매개 변수의 정의에는 2개의 고정 수평 포인트가 필요합니다.

참조: 거리 축척 매개 변수는 지오이드 변환에 사용되지 않습니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    거리 상수 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[값] 필드와 [상태] 필드를 이용하여 GPS 매개 변수 그룹의 모든 거리 관측치에 대한 상수 거리값(프로젝트 단위)을 보거나 확인, 입력합니다. 이 매개 변수는 관측치의 거리 정오차를 보정합니다. 이 매개 변수의 정의에는 2개의 고정 수평 포인트가 필요합니다.

참조: 거리 상수 매개 변수는 지오이드 변환에 사용되지 않습니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    고도 상수 (변환 매개 변수)

추가 정보

방법 ...	대화 상자	기타
개요

[값] 필드와 [상태] 필드를 이용하여 이 변환 그룹의 모든 수직 관측치에 추가되는 상수 고도값을 보거나 입력, 계산, 정의합니다. 고도 상수는 관측치의 정오차 보정과 지오이드 모델 변환에 이용됩니다. 이 매개 변수 값은 표고와 고도를 각각 하나씩 필요로 합니다.

이 매개 변수는 수직 관측치의 정오차 보정과 지오이드 모델의 변환에 이용합니다.

자세한 내용은 변환 매개 변수 정의하기를 참조하십시오.


    그룹 관측치 (변환 그룹 - GPS)

추가 정보

방법 ...	대화 상자	기타
개요

이 목록을 이용하여 GPS 변환 그룹을 보고 그 관측치를 추가하거나 제거합니다. 아무 필드도 편집은 할 수 없습니다.

나오는 열:

열	표시 내용
관측치	관측치에 지정된 ID. GPS 관측치 번호 앞에 B 자가 붙습니다.
시점	관측이 이루어진 기점
종점	관측의 대상점
종류	관측치 수집에 이용한 측량 방식

팁: 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    이용 가능 관측치 (변환 그룹 - GPS)

추가 정보

방법 ...	대화 상자	기타
개요

이 목록을 이용하여 망 조정의 모든 이용 관측치를 봅니다. 이 목록에서 관측치를 선택하여 GPS 변환 그룹에 추가할 수도 있습니다. 모든 필드는 보기용이므로 편집할 수 없습니다.

데이터를 프로젝트에 처음 로드할 때, '이용' 상태인 관측치는 모두 <GPS 기본값> 그룹에 추가됩니다. 이 관측치들은 사용자 정의 변환 그룹으로 옮길 수 있지만 각 관측치는 단 하나의 사용자 정의 그룹에만 있을 수 있습니다.

어떤 관측치이든 이 목록에서 선택하여 현재의 변환 그룹에 추가할 수 있습니다. 다른 사용자 정의 변환 그룹에 지정된 관측치도 마찬가지입니다. 다른 사용자 정의 변환 그룹에 속하는 관측치는 현재의 그룹에 추가하면 원래 그룹에서 제거됩니다.

팁: 하나 또는 그 이상의 측량 방식으로 수집한 관측치를 필터링 할 수 있습니다. 필터링이 된 관측치는 일시적으로 숨겨지므로 그 목록의 크기가 작아지고, 따라서 관측치를 찾기 용이해집니다. 관측치 수집에 쓴 측량 방식은 [종류] 필드에 나옵니다. 자세한 내용은 관측치 필터링 하기를 참조하십시오.

참조: 이 목록은 프로젝트의 모든 관측치가 아니라 망 조정에 쓰인 관측치만 반영합니다.

나오는 열:

열	표시 내용
관측치	관측치에 지정된 ID. GPS 관측치 번호 앞에 B 자가 붙습니다.
시점	관측이 이루어진 기점의 이름
종점	관측 대상점의 이름
종류	관측치 수집에 이용한 GPS 측량 방식. 가능한 4가지 값은 RTK, Kinematic, Static, 연속(Continuous)
변환 그룹	관측치가 속하는 변환 그룹

팁: 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    그룹 관측치 (변환 그룹 - 지오이드)

추가 정보

 기타

개요

이 목록을 이용하여 <지오이드 기본값> 변환 그룹을 봅니다. 모든 필드는 보기용이므로 편집할 수 없습니다.

망 조정에 쓰인 지오이드 관측치는 지오이드 분리 간격을 망 조정에 로드할 때, 모두 이 목록에 자동 로드됩니다.

지오이드 관측치는 이 목록에서 삭제할 수 없습니다. 이 목록에서 관측치를 제거하는 유일한 방법은 그 관측치를 이용 해제시킴으로써 프로젝트에서 쓰지 못하게 하는 것입니다.

팁: 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.

나오는 열:

열	표시 내용
관측치	관측치에 지정된 ID. G 자가 지오이드 관측치의 번호 앞에 나옵니다.
포인트	지오이드 모델에서 지오이드 관측치를 추출함에 이용한 좌표점의 이름
분리 간격	WGS-84 타원체와 평균 해수면 사이의 지오이드 분리 간격
오차	지오이드 분리 간격의 추정 오차
참조: 지오이드 분리 간격의 시초 추정 오차는 관측치 집합의 표준 오차입니다. Trimble Geomatics Office 소프트웨어는 망 조정에 있는 모든 지오이드 분리 간격의 평균을 계산한 다음, 그 표준 오차를 결정합니다. 이것은 단지 시작에 불과한데 추정 오차의 참값을 얻기 위해서는 해당 관측치들을 스케일 할 필요가 있습니다.

참조: 표준 오차는 [망 조정 스타일] 대화 상자에서 지오이드 분리 간격의 최소 표준 오차를 증가시킴으로서 변경할 수 있습니다.


    이용 가능 관측치 (변환 그룹 - 지오이드)

추가 정보

 기타

개요

[이용 가능 관측치] 목록이 해제되므로 쓰지 못합니다.


그룹 관측치 (변환 그룹 - 비GPS)

개요

이 목록을 이용하여 비GPS 변환 그룹을 보고 그 관측치를 추가하거나 제거합니다. 이 목록의  정보는 수정할 수 없습니다.

나오는 열:

열	표시 내용
관측치	관측치에 지정된 ID. 비GPS 관측치 번호의 앞에는 T 자가 붙고, 레벨 관측치의 앞에는 L 자가 붙습니다.
후시점	관측 후시점의 이름
기계점	관측 기계점의 이름
전시점	관측 전시점의 이름

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.

참조: 레벨 관측치와 방위각 관측치는 비GPS 관측치로 취급됩니다. 이들의 경우에는 '기계점'은 '시점', '전시점'은 '종점'으로 생각하도록 합니다


이용 가능 관측치 (변환 그룹 - 비GPS)

개요

망 조정에 이용한 관측치가 모두 이 목록에 표시됩니다. 여기에서 망 조정의 모든 이용 관측치를 보거나 선택 관측치를 비GPS 변환 그룹에 추가할 수 있습니다. 이 목록의 정보는 수정할 수 없습니다.

데이터를 프로젝트에 처음 로드할 때, '이용' 상태인 관측치는 모두 <비GPS 기본값> 그룹에 추가됩니다. 사용자 정의 변환 그룹들을 만듬에 따라 <비GPS 기본값>에서 관측치가 제거됩니다.

어떤 관측치이든 [이용 가능 관측치] 목록에서 선택하여 현재의 변환 그룹에 추가할 수 있습니다. 다른 사용자 정의 변환 그룹에 지정된 관측치도 마찬가지입니다. (다른 사용자 정의 변환 그룹에 속하는 관측치는 현재의 그룹에 추가하면 원래 그룹에서 제거됩니다.)

팁: 서로 다른 측량 방식으로 수집한 관측치를 필터링 할 수 있습니다. 필터링이 된 관측치는 일시적으로 숨겨지므로 그 목록의 크기가 작아지고, 따라서 관측치를 찾기 용이해집니다. 관측치 수집에 쓴 측량 방식은 [종류] 필드에 나옵니다. 자세한 내용은 관측치 필터링 하기를 참조하십시오.

나오는 열:

열	표시 내용
관측치	관측치에 지정된 번호. 비GPS 관측치 번호의 앞에는 T 자가 붙고, 레벨 관측치의 앞에는 L 자가 붙습니다.
후시점	관측 후시점의 이름
기계점	관측 기계점의 이름
전시점 변환 그룹	관측 전시점의 이름 이 열은 해당 관측치가 변환 그룹에 지정되어 있는지 여부를 표시합니다.

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.

참조: 레벨 관측치와 방위각 관측치는 비GPS 관측치로 취급됩니다. 이들의 경우에는 '기계점'은 '시점', '전시점'은 '종점'으로 생각하도록 합니다


    [가중 전략] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

가중 전략(Weighting strategies)을 정의해서 GPS 관측치와 비GPS 관측치, 지오이드 관측치, 분산 그룹에 적용하는 대화 상자입니다.

[가중 전략] 대화 상자를 불러오려면

  [조정 / 가중 전략] 명령을 실행합니다.

이 대화 상자에는 [GPS], [비GPS], [지오이드] 탭이 있습니다. 각 탭 하에는 [관측치] 목록이 있어 망 조정에 포함된 관측치들을 볼 수 있는데, 어느 탭을 택하느냐에 따라 'GPS 관측치'나 '비GPS 관측치', '지오이드 분리 간격 값이 있는 포인트' 가 모두 표시됩니다.

각 탭 하에서의 옵션:

스칼라 적용 대상

관측치나 분산 그룹에 대한 스칼라 적용 방식을 정의하는 옵션입니다.

스칼라 형

[스칼라 적용 대상] 상자에서 선택한 방식을 써서 추정 오차에 스칼라를 적용하는 옵션입니다. 자세한 내용은 스칼라 형을 참조하십시오.

스칼라 값

이 필드는 [스칼라 형] 상자에서 '사용자 정의' 옵션을 택한 경우에만 활성화됩니다. 적용하고자 하는 스칼라 값을 입력합니다.

[고정] 단추를 누르면 현행 망 조정의 스칼라가 이 필드에 삽입됩니다.

주의: 이 필드를 수정할 경우에는 아주 세심한 주의를 하여야 합니다. 가중 전략 결과의 평가와 관련, 보다 자세한 지침은 가중 전략 보고서 통계를 참조하십시오.

관측치

GPS 관측치나 비GPS 관측치, 지오이드 관측치(지오이드 분리 간격이 있는 관측치)에 대한 스칼라를 봅니다. 이 목록의 모양과 내용은 선택한 탭 여하에 따라 달라집니다. 자세한 사항은 다음 항목들을 참조합니다.

  관측치 (GPS)

  관측치 (비GPS)

  관측치 (지오이드)

그룹

분산 그룹과, 그 그룹의 모든 관측치에 적용되는 스칼라 값을 봅니다. 이 목록은 선택한 탭이 [GPS] 탭이고, [스칼라 적용 대상]에서 설정한 방식이 '분산 그룹'일 때 자동으로 나옵니다. 자세한 내용은 그룹을 참조하십시오.

고정

현재의 스칼라 값을 고정(lock)하고자 하면 이 단추를 누릅니다.

'대체' 스칼라 형 하에서 망 조정이 카이 자승 검정(기준 계수 ~ 1.00)을 통과하게 되면 그 스칼라 값을 고정하도록 합니다. 이 경우 스칼라 형이 '사용자 정의'로 자동 변경되고, 그 스칼라가 [스칼라 값] 필드에 나옵니다. '대체' 스칼라 형은 더 이상 쓰이지 않게 됩니다.

참조: '자동' 스칼라 형 옵션을 선택하고 자동 망 조정을 수행할 경우, 그 스칼라 값이 고정되고 스칼라 형이 '사용자 정의'로 변경됩니다.

[고정] 단추는 '기본값'이나 '사용자 정의' 스칼라 형의 선택시에는 활성화되지 않습니다.

적용

스칼라 가중 전략을 차회의 조정 반복 연산에 적용하고자 하면 이 단추를 누릅니다. [적용] 단추는 반드시 '사용자 정의' 스칼라 형을 선택하여야만 이용할 수 있습니다.

필터

[관측치 필터] 대화 상자를 불러오는 단추입니다. 필터링은 다수의 관측치를 볼 때 유용하게 쓰이는 기능인데, 대화 상자를 닫는 순간 모든 필터는 자동으로 제거됩니다. 자세한 내용은 관측치 필터링 하기를 참조하십시오.


    GPS (가중 전략)

추가 정보

방법 ...	대화 상자	기타
개요

[GPS] 탭 하에서 GPS 관측치에 대한 가중 전략을 보거나 정의, 적용합니다.

액세스 방법:

1.	[조정 / 가중 전략] 명령을 실행하면 [가중 전략] 대화 상자가 나옵니다.

2.	[GPS] 탭을 선택합니다.

분산 그룹에 대한 가중 전략을 액세스하려면 한 단계가 더 필요합니다.

분산 그룹 옵션의 액세스 방법:

  스칼라 적용 대상 옵션을 '분산 그룹'으로 설정합니다.

이 대화 상자의 모양이 바뀌고, [관측치] 목록이 [그룹] 목록으로 대체됩니다. 이 목록에서 분산 그룹을 선택하고 가중 전략을 정의한 후, 이를 해당 분산 그룹의 관측치에 적용할 수 있습니다.


비GPS (가중 전략)

개요

[비GPS] 탭 하에서 비GPS 관측치에 대한 가중 전략을 보거나 정의, 적용합니다. 분산 그룹에 대한 가중 전략을 액세스할 수도 있습니다.

방법:

1.	[조정 / 가중 전략] 명령을 실행하면 [가중 전략] 대화 상자가 나옵니다.

2.	[비GPS] 탭을 선택합니다.

3.	분산 그룹에 대한 가중 전략을 액세스하려면 [스칼라 적용 대상] 상자에서 '분산 그룹' 옵션을 선택합니다.

[관측치] 목록이 [그룹] 목록이 되면, 원하는 분산 그룹을 이 목록에서 선택합니다. 가중 전략을 정의하여 이를 해당 분산 그룹의 관측치에 적용할 수 있습니다.


    지오이드 (가중 전략)

추가 정보

방법 ...	대화 상자	기타
[지오이드] 탭 하에서 지오이드 관측치에 대한 가중 전략을 보거나 정의, 적용합니다

방법:

1.	[조정 / 가중 전략] 명령을 실행하면 [가중 전략] 대화 상자가 나옵니다.

2.	[지오이드] 탭을 선택합니다.

만일 목록에 아무 관측치도 나오지 않으면 [관측치] 대화 상자의 [지오이드] 탭을 확인하도록 합니다. 반드시 지오이드 모델을 프로젝트에 지정하고, 이 모델로부터 프로젝트에 지오이드 분리 간격을 로드하여야만 합니다.

참조: 지오이드 분리 간격의 추정 오차로서 처음 적용하는 것은 관측치 집합상의 표준 오차입니다. Trimble Geomatics Office 소프트웨어는 망 조정에 있는 모든 지오이드 분리 간격의 평균을 계산한 다음, 이 평균으로부터 각 분리 간격에 대한 표준 오차를 결정하게 됩니다. 이것은 지오이드 분리 간격의 오차 추정에 있어 시작에 불과한데, 추정 오차의 참값을 얻기 위해서는 해당 관측치들을 스케일 할 필요가 있습니다.

참조: 표준 오차는 [망 조정 스타일] 대화 상자에서 지오이드 분리 간격의 최소 표준 오차를 증가시킴으로서 바꿀 수 있습니다.


    스칼라 적용 대상

추가 정보

방법 ...	대화 상자	기타
개요

관측치나 분산 그룹에 스칼라 가중 전략을 적용할 때 쓰는 방식을 선택하려면 이 단추를 이용합니다.

선택 옵션:

모든 관측치

전반적인 망 오차를 토대로 하여, 특정 유형(GPS, 비GPS,지오이드)의 망 조정 관측치 전부에 단일 스칼라 가중 전략을 적용합니다. 이것은 망 조정의 기본값 옵션입니다.

이 옵션은 망의 측정치들이 모두 동일한 측량기와 동일한 측량 기준으로 이루어진 경우 선택하는데, 작업중인 망이 단순한 것일 때 적합합니다.

스칼라 형을 '기본값'으로 설정하면 1.0의 기본 스칼라가 모든 관측치에 적용됩니다.

'대체' 스칼라 형 하에서는 직전 조정의 그룹 기준 계수를 그 조정의 스칼라로 곱한 값이 모든 관측치의 전체 추정 오차에 적용됩니다.

'사용자 정의' 스칼라 형 하에서는 스칼라 값을 입력할 수 있도록 커서가 [그룹] 목록의 [스칼라 값] 필드에 나옵니다. 이 필드에 입력하는 값은 그 다음의 조정 반복 연산을 수행할 때 모든 관측치의 전체 추정 오차에 적용됩니다.

설정한 스칼라 형이 '자동'이면 소프트웨어는 '대체' 스칼라 형 옵션을 이용하여 자동으로 망 조정을 수행합니다. 이 조정은 카이 자승 검정을 통과할 때까지 반복됩니다.

가중 전략의 결과 평가에 대한 자세한 내용은 조정 보고서의 가중 전략 섹션을 참조합니다.

각 관측치

각 벡터의 오차를 토대로 하여, 개별 가중 전략을 각각의 망 조정 벡터에 대하여 적용하는 옵션입니다.

참조: 이 옵션은 [GPS] 탭 하에서만 가능합니다.

이 설정은 망에서 불량 관측치를 찾아내는 등의 진단 목적에 이용하도록 합니다. 최종 망 조정에 대해서는 이 방식의 스칼라 가중 적용을 하지 않도록 합니다(Trimble권장 사항).

스칼라 형을 '기본값'으로 설정하면 1.0의 기본 스칼라가 각 관측치에 적용됩니다.

'대체' 스칼라 형 하에서는 직전 조정의 분산 그룹 기준 계수를 그 조정의 스칼라로 곱한 값이 각 관측치의 모든 추정 오차에 적용됩니다.

가중 전략의 결과 평가에 대한 자세한 내용은 조정 보고서의 [가중 전략] 섹션을 참조합니다.

분산 그룹

가중 전략을 분산 그룹의 모든 관측치에 적용하는 옵션입니다.

참조: 이 옵션은 [가중 전략] 대화 상자의 [GPS] 탭이나 [비GPS] 탭 하에서만 가능합니다.

이 옵션을 선택하면 [관측치] 목록이 [그룹] 목록으로 대체되고 모든 분산 그룹과 그 스칼라 값이 표시됩니다.

스칼라 형을 '기본값'으로 설정하면 1.0의 기본 스칼라가 그룹의 모든 관측치에 적용됩니다.

'대체' 스칼라 형 하에서는 직전 조정의 그룹 기준 계수를 그 조정의 스칼라로 곱한 값이 그룹 관측치들의 모든 추정 오차에 적용됩니다.

'사용자 정의' 스칼라 형 하에서는 스칼라 값을 입력할 수 있도록 커서가 [그룹] 목록의 [스칼라 값] 필드에 나옵니다. 이 필드에 입력하는 값은 그 다음의 조정 반복 연산을 수행할 때 그룹 관측치들의 모든 추정 오차에 적용됩니다.

설정한 스칼라 형이 '자동'이면 소프트웨어는 '대체' 스칼라 형 옵션을 이용하여 자동으로 망 조정을 수행합니다. 이 조정은 카이 자승 검정을 통과할 때까지 반복됩니다.

가중 전략의 결과 평가에 대한 자세한 내용은 조정 보고서의 가중 전략 섹션을 참조합니다.

GPS 관측치는 '모든 관측치', '각 관측치', '분산 그룹' 옵션이 모두 가능하고, 비GPS 관측치는 '모든 관측치'와 '분산 그룹' 옵션이 가능하며, 지오이드 관측치는 '모든 관측치'만 가능합니다.

가능한 조합의 가중 전략:

스칼라 형	스칼라 적용 대상	스칼라 목록
기본값	모든 관측치	가중 전략 비적용
	각 관측치	가중 전략 비적용
	분산 그룹	가중 전략 비적용
대체	모든 관측치	각 종류에 단일 스칼라 적용
	각 관측치	각 관측치에 다른 스칼라 적용
	분산 그룹	각 그룹에 단일 스칼라 적용
사용자 정의	모든 관측치	단일 스칼라 적용
	분산 그룹	각 그룹에 단일 스칼라 적용
자동	모든 관측치	단일 스칼라 적용
	분산 그룹	각 그룹에 단일 스칼라 적용


    스칼라 형

추가 정보

방법 ...	대화 상자	기타
개요

GPS 관측치나 비GPS 관측치, 지오이드 관측치, 분산 그룹에 적용할 스칼라 형을 선택하는 옵션입니다.

선택 옵션:

기본값

[스칼라 적용 대상] 목록에서의 설정 방식을 이용하여 기본값 스칼라 1.0을 추정 오차에 적용하려면 이 옵션을 선택합니다.

이 옵션(첫회 반복 연산에 대한 기본값 설정임)은 조정의 첫번째 반복 연산에 적용합니다. 이 옵션을 쓰면 있는 그대로 추정 오차가 적용되므로 사용자가 망의 오차를 평가할 수 있게 됩니다.

참조: 어떤 관측치를 조정으로부터 제거할 경우에는 기본값 스칼라 형을 다시 이용하여야 합니다.

참조: GPS 관측치에 기본값 스칼라를 적용할 경우 시점의 좌표가 저장되어 모든 후속 조정에 적용됨으로써(또 다른 기본값 스칼라 조정을 하기 전까지) 해당 벡터를 타원체 상으로 모델화합니다.

가중 전략의 결과 평가에 대한 자세한 내용은 조정 보고서의 가중 전략 섹션을 참조합니다.

대체

이 옵션 하에서 적용하는 스칼라는 직전 조정의 기준 계수를 그 조정의 스칼라로 곱한 값입니다. 산출 스칼라 값은 [스칼라 적용 대상] 옵션에서의 설정 방식에 의거, 추정 오차에 적용되므로 Trimble Geomatics Office 소프트웨어가 그 다음 조정 반복 연산에 대한 스칼라를 자동 계산할 수 있게 됩니다.

대체 스칼라는 종합 통계가 수용 가능한 수준이 될 때까지(즉, 카이 자승 검정을 통과할 때까지) 각 조정 반복 연산의 추정 오차에 적용됩니다. 일단 검정을 통과하게 되면 후속하는 각 조정 반복 연산에 더 이상 새 스칼라가 적용되지 않도록 하기 위하여 그 스칼라 값을 고정하도록 합니다.

가중 전략의 결과 평가에 대한 자세한 내용은 조정 보고서의 [가중 전략] 섹션을 참조합니다.

참조: 이상값의 추정 오차는 망 조정에서 제거하기에 앞서 대체 스케일링을 시도하여야 합니다. 그러면 스케일링 후에 그 이상값의 추정 오차가 수용 가능할지 여부를 알 수 있게 됩니다. 만일 대체 스케일링(Alternative scaling)이 이상값의 문제를 해결하지 못한다면 이를 제거하고 가중 전략을 기본값 스칼라 형으로 되돌리도록 합니다.

주의: 대체 스칼라의 적용시 조정 반복 연산 과정이 진행됨에 따라 그 스칼라의 크기를 체크하십시오. 유난히 큰 스칼라를 써서 이상값을 해소하는 것은 바람직하지 않습니다.

사용자 정의

[스칼라 적용 대상] 옵션에서의 설정 방식에 의거, 사용자 정의 스칼라를 추정 오차에 적용하는 옵션입니다.

[스칼라 적용 대상] 옵션에서 선택한 방식이 '각 관측치'일 경우 '사용자 정의' 옵션은 해제됩니다.

이 옵션은 대체 스케일링이 완료되어 [고정] 단추를 사용할 때, 자동 설정됩니다. 조정에 적용된 마지막 대체 스칼라가 [스칼라 값] 필드에 들어가고 사용자 정의 스칼라가 됩니다.

사용자가 수동으로 스칼라를 정의하는 것은 최소 자승 조정과 측량 측정치에 대한 해박한 지식을 요하므로 Trimble Geomatics Office 소프트웨어의 초보 사용자에게는 권하지 않습니다. 최소 자승 조정과 측량 측정치에 대한 자세한 내용은 참고 문헌을 참조하십시오.

자동

'자동' 스칼라 형 하에서는 소프트웨어가 '대체' 스칼라 형 옵션을 이용하여 자동으로 망 조정을 수행합니다. (언제라도 조정을 중단하려면 ESC 키를 누릅니다.)

이 조정은 종합 통계가 수용 가능한 수준이 될 때까지(즉, 카이 자승 검정을 통과할 때까지) 반복됩니다. 하지만 반복 연산이 10회 진행될 때까지 카이 자승 검정을 통과하지 않는다면 조정이 종료되면서 경고 메시지가 나옵니다. 이 때에는 조정 작업에 쓴 입력 데이터를 검토해 볼 필요가 있습니다.

자동 조정이 성공리에 완료되면 해당 스칼라 값이 고정(lock)되고 스칼라 형이 '사용자 정의' 방식으로 됩니다. 이 때 조정이 한번 더 이루어지는데, 그러고 나면 망 조정 보고서를 볼 수 있게 됩니다. 이 경우 망 조정 보고서에 표시되는 스칼라 형은 '사용자 정의'입니다.

참조: 자동 조정이 성공적으로 완료되지 않으면(즉, 카이 자승 검정에 실패하면), 망 조정 보고서에 표시되는 스칼라 형은 '대체'입니다.

참조: 데이터 집합상의 과오(blunder)는 망 조정의 다른 관측치들을 과도하게 스케일링하는 원인이 됩니다. 따라서 '자동' 스칼라 형을 적용하기 전에 반드시 과오를 전부 제거하도록 합니다. 기본값 스칼라 옵션으로써 조정을 수행한 후, 그 결과를 검토하면 과오나 잘못된 데이터를 체크할 수 있습니다.

'자동' 스칼라 형을 적용한 후, 그 조정 결과(특히 조정 히스토그램)를 세밀히 검토함으로써 관측치에 과오가 숨겨져 있지 않은지 확인합니다.

주의: '자동' 스칼라 형 옵션을 이용하여 GPS 관측치와 비GPS 관측치를 동시에 스케일링 하지 않도록 합니다.

가중 전략의 결과 평가에 대한 자세한 내용은 망 조정 보고서의 [가중 전략] 섹션을 참조합니다.

가능한 여러가지의 가중 전략 옵션:

스칼라 형	스칼라 적용 대상	스칼라 목록
기본값	모든 관측치	가중 전략 비적용
	각 관측치	가중 전략 비적용
	분산 그룹	가중 전략 비적용
대체	모든 관측치	단일 스칼라 적용
	각 관측치	각 관측치에 다른 스칼라 적용
	분산 그룹	각 그룹에 단일 스칼라 적용
사용자 정의	모든 관측치	단일 스칼라 적용
	분산 그룹	각 그룹에 단일 스칼라 적용
자동	모든 관측치	단일 스칼라 적용
	분산 그룹	각 그룹에 단일 스칼라 적용

가중 전략의 결과 평가에 대한 자세한 내용은 조정 보고서의 가중 전략 섹션을 참조합니다.


    관측치 (가중 전략)

추가 정보

 기타

개요

[관측치] 목록을 이용하면 망 조정 관측치의 각각에 적용하는 가중 전략을 볼 수 있습니다. [가중 전략] 대화 상자의 탭(GPS, 비GPS, 지오이드) 여하에 따라 서로 다른 목록이 나옵니다.

하지만, [GPS] 탭과 [비GPS] 탭 하에서 스칼라 적용 대상을 '분산 그룹'으로 설정할 경우에는 [관측치] 목록이 자동으로 [그룹] 목록이 됩니다.

자세한 내용은 다음 항목들을 참조하십시오.

  관측치 − GPS 관측치

  관측치 − 비GPS 관측치

  관측치 − 지오이드 관측치


    관측치 (가중 전략 - GPS )

추가 정보

방법 ...	대화 상자	기타
개요

이 [관측치] 목록을 이용하여, 모든 망 조정 GPS 관측치의 스칼라 가중 전략을 봅니다. 목록의 정보는 어느 것도 수정할 수 없습니다.

[관측치] 목록은 [스칼라 적용 대상]을 '모든 관측치' 방식이나 '각 관측치' 방식으로 설정하는 경우에만 이용 가능합니다. [스칼라 적용 대상]의 설정 방식이 '분산 그룹'일 때에는 [관측치] 목록이 자동으로 [그룹] 목록으로 됩니다.

팁: [필터] 단추를 이용하면 서로 다른 측량 방식으로 수집한 관측치를 필터링 할 수 있습니다. 필터링을 하면 특정 관측치가 일시적으로 숨겨지므로 다른 관측치를 찾기가 용이해집니다. 관측치 수집에 쓴 측량 방식은 [종류] 필드에 나옵니다. 자세한 내용은 관측치 필터링 하기 를 참조하십시오.

나오는 열:

열	표시 내용
관측치	망 조정 관측치의 레코드 번호. 레코드의 앞에 붙은 'B'자는 그것이 GPS 관측치임을 나타냅니다.
시점	관측이 이루어진 기점
종점	관측의 대상점
스칼라  종류 분산 그룹	관측치에 대한 개별 스칼라 GPS 관측치 종류 관측치의 지정 분산 그룹. 개별 GPS 관측치는 단일 분산 그룹에만 지정할 수 있습니다. 즉, 사용자 정의 분산 그룹이 여러 개 있을 수 있지만 각 관측치는 그 중 하나의 그룹에만 지정할 수 있을 뿐입니다.

팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    관측치 (가중 전략 - 지오이드)

추가 정보

방법 ...	대화 상자	기타
개요

이 [관측치] 목록을 이용하면 프로젝트에 로드된 지오이드 관측치를 볼 수 있습니다. 목록의 정보는 어느 것도 수정할 수 없습니다.

프로젝트에서 어떤 지오이드 모델을 선택하지 않았거나, 지오이드 분리 간격을 로드하지 않은 경우에는 [관측치] 목록이 비어 있습니다.

나오는 열:

열	표시 내용
관측치	망 조정 관측치의 레코드 번호. 레코드의 앞에 붙은 G 자는 그것이 지오이드 관측치임을 나타냅니다.
포인트	지오이드 관측치의 도출에 쓴 포인트 이름
다음 스칼라	관측치에 적용될 다음 스칼라 값
분리 간격	선택한 지오이드 모델로부터의 지오이드 분리 간격
오차	지오이드 관측치의 추정 오차
분산 그룹	관측치가 분산 그룹에 지정되어 있는지 여부를 표시. 지오이드 분산 그룹은 하나뿐이므로 모든 지오이드 관측치가 <지오이드 기본값> 그룹에 지정됩니다. 참조: <지오이드 기본값> 그룹은 어느 망 조정에서나 항상 하나밖에 없는 지오이드 분산 그룹입니다. 동일한 지오이드 모델로부터 각각의 지오이드 관측치를 보간할 때 쓰는 방식이 동일하므로 이들을 여러 개의 그룹으로 분리할 필요가 없습니다.
팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


    그룹 (가중 전략)

추가 정보

방법 ...	대화 상자	기타
개요

[그룹] 목록은 그룹의 모든 관측치에 적용되는 분산 그룹과 스칼라 값을 표시합니다.

[그룹] 목록은 [가중 전략] 대화 상자의 [GPS] 탭과 [비GPS] 탭 하에서 [스칼라 적용 대상]을 '분산 그룹' 방식으로 설정하는 경우에 나옵니다. [지오이드] 탭에서는 이 목록이 나오지 않습니다.

나오는 열:

열	표시 내용
그룹 이름	분산 그룹의 이름. 이 열의 정보는 수정할 수 없습니다.
다음 스칼라	분산 그룹에 쓰이는 다음 스칼라 값. '사용자 정의' 스칼라 형의 선택시에는 이 열에 어떤 스칼라 값을 입력할 수 있지만, '기본값'이나 '대체' 스칼라 형이라면 이 열의 정보를 수정할 수 없습니다.
팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.


관측치 (가중 전략 - 비GPS)

개요

이 목록은 [스칼라 적용 대상]의 설정 옵션이 '모든 관측치' 방식일 경우에만 이용할 수 있습니다. 이 목록에는 망 조정에 있는 모든 비GPS 관측치의 스칼라 가중 전략이 표시되는데, 이 중 어느 필드도 수정은 할 수 없습니다.

팁: [필터] 단추를 이용하면 서로 다른 관측치 종류를 필터링 할 수 있습니다. 필터링을 하면 특정 관측치가 일시적으로 숨겨지므로 다른 관측치를 보기가 용이해집니다. 자세한 내용은 관측치 필터링 하기를 참조하십시오.

나오는 열:

열	표시 내용
관측치	망 조정 관측치의 레코드 번호. 레코드의 앞에 붙은 T 자는 그것이 비GPS 관측치임을 나타내고, L 자는 레벨 관측치임을 나타냅니다.
후시점	관측 후시점 이름
기계점 전시점 다음 스칼라	관측 기계점 이름 관측 전시점 이름 관측치에 적용될 다음 스칼라
분리 간격	선택한 지오이드 모델로부터의 지오이드 분리 간격
오차	지오이드 관측치의 추정 오차
분산 그룹	관측치의 지정 분산 그룹. 사용자 정의 그룹이 여러 개 있을 수 있지만 비GPS 관측치의 각각은 하나의 분산 그룹에만 지정할 수 있을 뿐입니다.
팁: 목록의 열은 크기를 조정하거나 이동, 정렬할 수 있습니다.

참조: 레벨 관측치와 방위각 관측치는 비GPS 관측치로 취급됩니다. 이들의 경우에는 '기계점'은 '시점', '전시점'은 '종점'으로 생각하도록 합니다.


    조정 헤더

추가 정보

 기타

개요

프로젝트 정보가 보고서 상단의 조정 헤더에 나옵니다.

이 헤더의 수록 정보는 프로젝트 등록 정보에서 나온 것입니다. 화면의 왼쪽에는 목차가 있는데 보고서의 각 섹션에 대한 하이퍼링크가 있습니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	목차의 하이퍼링크를 써서 보고서의 특정 항목으로 찾아갑니다.

나오는 필드나 하위 섹션:

프로젝트

프로젝트 이름이 이 필드에 나옵니다.

사용자 이름

프로젝트 등록 정보에서 입력한 이름이 이 필드에 나옵니다.

날짜와 시간

보고서를 만든 날짜와 시간이 이 필드에 나옵니다.

좌표계

프로젝트 등록 정보에서 선택한 좌표계가 이 필드에 나옵니다.

존

프로젝트 등록 정보에서 선택한 좌표계 존이 이 필드에 나옵니다. GPS 캘리브레이션 사이트를 선택한 경우에는 그 사이트 이름이 나옵니다.

모든 공표된 좌표계는 존이 있습니다. 유일한 예외는 기본 투영법의 경우로서, [존] 필드에 '기본값'이 표시됩니다. 이 기본값은 N = 10000, E = 10000, 표고 = 100와 같이 사이트의 좌표를 가정할 때 이용합니다.

프로젝트 데이텀

프로젝트 등록 정보에서 선택한 프로젝트 데이텀이 이 필드에 나옵니다. 이것은 조정용으로 선택한 데이텀을 의미하지 않습니다.

수직 데이텀

이 필드를 망 조정 보고서 헤더 정보에 추가할 수 있습니다. 필요한 내역을 [프로젝트 등록 정보] 대화 상자 / [프로젝트 내역] 탭 하의 [수직 데이텀] 필드에 추가하면 됩니다.

지오이드 모델

지오이드 모델이 프로젝트 등록 정보에 지정되어 있는 경우에는 이 필드에 나옵니다. 프로젝트에 지정된 모델이 없다면 '선택되지 않았음'이라고 표시됩니다.

좌표 단위

프로젝트 등록 정보에서 선택한 좌표계의 단위가 이 필드에 나옵니다.

거리 단위

프로젝트 등록 정보에서 선택한 거리 단위가 이 필드에 나옵니다.

높이 단위

프로젝트 등록 정보에서 선택한 높이 단위가 이 필드에 나옵니다.

내용

화면의 왼쪽에는 아래 하이퍼링크의 전부 또는 일부가 포함된 목차가 있습니다.

  프로젝트 내역

  조정 스타일 설정

  잔차 허용 범위

  공분산 표시

  조정 제어

  설치 오차

  통계 요약

  GPS 관측치 통계

 지오이드 모델 통계

  비GPS 관측치 통계

  가중 전략

  조정된 좌표

  그리드 좌표

  측지 좌표

  좌표 델타

  기준 좌표 비교

  조정된 관측치

  GPS 관측치

  지오이드 관측치

  비GPS 관측치

  표준 잔차의 히스토그램

  포인트 오차 타원

  공변항

상기 하이퍼링크를 선택하면 개별 보고서 섹션에 대하여 보다 자세한 정보를 볼 수 있습니다.


    조정된 좌표

추가 정보

 기타

개요

이 통계를 이용하여 다음 사항을 봅니다.

  포인트 수

  좌표 구성 요소에 제약된 포인트 수

  제약된 포인트와 조정된 포인트의 좌표 값

  망 조정 포인트 각각의 사후 표준 (추정) 오차

  최종 추정 오차

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정된 좌표를 클릭합니다.

[조정된 좌표] 섹션에는 일단의 필드 및 다음의 표가 나옵니다.

  조정된 그리드 좌표

  조정된 측지 좌표

  조정된 좌표 델타

이 표에는 망 조정 포인트 각각에 대한 데이터가 들어 있습니다.

나오는 필드:

조정 데이텀

망 조정에 쓰인 데이텀이 이 필드에 나옵니다. GPS 관측치의 최소 제약 조정이나 자유 조정에는 WGS-84 데이텀을 써야 합니다. WGS-84 데이텀을 선택하는 경우, 이 필드는 다음과 같이 표시됩니다.

조정 데이텀: WGS-84

완전 제약 조정은 프로젝트 데이텀으로써 수행합니다. 이 경우, WGS-84 대신 해당 프로젝트 데이텀의 이름이 이 필드에 나옵니다.

포인트 수

망 조정에 포함된 포인트의 수가 이 필드에 나옵니다.

제약된 포인트 수

제약된 좌표 구성 요소가 있는 포인트의 수가 이 필드에 나옵니다.

제약된 포인트의 수는 고정 구성 요소(fixed components)별로 구분 표시됩니다. 예:

  수평만

  고도만

  표고만

  수평과 고도만

  수평과 표고만

  수평, 고도, 표고 모두

상기 필드 다음에는 다음과 같은 표가 뒤이어 나옵니다.

  조정된 그리드 좌표

  조정된 측지 좌표

  조정된 좌표 델타

각 표에 수록된 보고 데이터의 평가와 관련, 자세한 내용은 상기 해당 항목을 참조하십시오.


    좌표 델타

추가 정보

 기타

개요

이 표는 가장 최근 조정의 포인트들에 대한 좌표의 이동(조정) 크기를 표시합니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 '조정된 좌표 − 델타'를 클릭합니다.

조정된 좌표 델타의 통계가 나옵니다.

이 통계는 ①모든 망 조정 포인트 ②마지막으로 수행한 조정에서 각 구성 요소에 적용된 이동(shift)의 크기를 표시합니다. 이 델타는 해당 프로젝트의 좌표 단위에 의거, 선형 단위로 표시됩니다.

좌표 델타 정보는 완전 제약 조정의 수행 후에, 구체적으로 말하면 이동 크기의 이상 현상을 평가할 때 아주 유용하게 쓰입니다.

나오는 열:

열	표시할 조정(이동) 항목
포인트 이름	−
Δ위거	위거 좌표 구성 요소
Δ경거	경거 좌표 구성 요소
Δ표고	좌표의 표고
Δ고도	좌표의 타원체 고도
Δ지오이드 분리 간격	정의한 지오이드 모델이 있고 그 분리간격을 프로젝트에 로드한 경우의 지오이드 분리 간격. 이용할 수 있는 분리 간격이 없다면 이 필드는 공백임


    공변항

추가 정보

 기타

개요

이 통계는 망 조정 포인트간의 상대선 정확도(Relative line accuracy, 공변항)를 표시합니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 공변항을 클릭합니다.

공변항 통계가 나옵니다.

표시되는 공변항의 수는 조정 스타일에서 정의한 [일반] 등록 정보에 따라 달라집니다.

  모든 선 − 'Reduce Column Profile 이용'과 '공변항을 관측선에 한정' 옵션을 선택 해제하면 전체 망 포인트 사이의 가능한 모든 방위각, 델타 타원체 고도, 거리, 델타 표고가 그 관련 오차와 함께 표시됩니다.

  관측선 − 'Reduce Column Profile 이용'과 '공변항을 관측선에 한정' 옵션을 선택하면 전체 관측선에 대해서만 모든 방위각, 델타 타원체 고도, 거리, 델타 표고가 그 관련 오차와 함께 표시됩니다.

이 통계의 내용을 변경하는 것과 관련, 자세한 사항은 공분산 표시를 참조하십시오.

이 정밀도 통계를 토대로 하여 어느 망 포인트 쌍에서든 그 상대 오차를 파악합니다.

이 표의 열:

열	표시 내용
시점	상대 공변항에 대한 시점
종점	상대 공변항에 대한 종점
구성 요소	포인트간 상대선의 구성 요소
사후 오차 (   )	관측치 구성 요소의 사후 오차. 괄호 안에 나오는 것은 조정 스타일에서 정한 신뢰도인데 추정 사후 오차의 계산에 이용
수평 정밀도 (    )	공변값의 2차원(수평) 정밀도. 괄호 안에 나오는 것은 정밀도 표현 형식(PPM이나 비율)
3D 정밀도 (    )	공변값의 3차원(수평) 정밀도. 괄호 안에 나오는 것은 정밀도 표현 형식(PPM이나 비율)


    표준 잔차의 히스토그램

추가 정보

 기타

개요

이 히스토그램에서 다음의 정보를 봅니다.

  표준 잔차의 도수 분포

  관측치 이상값

  정규 분포 곡선

  임계 Tau 값

이 히스토그램을 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 표준 잔차의 히스토그램을 클릭합니다.

표준 잔차 히스토그램이 나옵니다.

이 히스토그램의 구성:

  결합 − 수평 및 수직 관측치 표준 잔차의 결합 플롯

  수평 − 수평 관측치 표준 잔차의 플롯

  수직 − 수직 관측치 표준 잔차의 플롯

이 히스토그램은 가장 최근 조정의 관측치 표준 잔차 도수 분포를 그래프로 나타낸 것입니다. 조정된 관측치 통계에는 각 관측치에 대한 표준 잔차의 목록이 나옵니다.

중앙 수직선은 0의 잔차입니다. 정규 분포에 의거, 잔차가 작을수록 빈도는 높고 중앙 수직선 가까이에 밀집하며, 큰 잔차일수록 빈도가 낮아지고 0 선에서 멀리 떨어집니다.

도수 분포 플롯은 조정 잔차가 무작위로 분포할 경우, 정규 분포 곡선에 가까워집니다. 이 곡선은 잔차 플롯에 포개어져 나타납니다.

0 선의 좌우에 있는 수직선들은 임계 Tau를 표시하는데 그 바깥의 표준 잔차는 모두 이상값으로 간주합니다. 막대바의 스케일은 시그마 값(조정된 관측치의 통계에 있는 Tau 값과 일치)을 의미합니다.


    개별 GPS 관측치 통계

추가 정보

 기타

개요

조정에 포함된(사용된) 각 관측치의 관측치 ID, 기준 계수, 여유도 수(자유도)를 나타내는 통계입니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다.

2.	목차에서 [GPS 관측치 통계]를 클릭합니다.

예시 통계:

관측치 ID	기준 계수	여유도 수
B1	1.56	2.03
B2	0.96	1.88
B3	1.21	1.66
B4	2.06	1.93

나오는 필드:

관측치 ID

관측치에 지정된 프로젝트 레코드 번호가 나옵니다. 이 레코드 번호는 B1이나 B235 등과 같이 B에 이어 하나 이상의 숫자가 뒤따르는 형식입니다.

기준 계수

각 개별 관측치의 기준 계수가 GPS 관측치 통계의 기준 계수에 어느 정도 기여하는지 알 수 있습니다.

참조: 모든 GPS 관측치의 기준 계수를 계산할 때 개별 관측치 전부의 기준 계수를 고려합니다. 전자의 값은 지오이드 관측치의 기준 계수와 더불어, 망 기준 계수의 계산에 쓰입니다.

여유도 수

이 필드를 보면 각 GPS 관측치가 GPS 관측치 통계에 어느 정도의 여유도를 기여하는지 파악할 수 있습니다. 또한 개별 GPS 관측치의 여유도 부족 여부도 알 수 있습니다. 관측치 통계의 여유도 수는 지오이드 관측치의 여유도 수와 함께 망의 자유도 계산에 쓰입니다.

고려할 지침 사항:

  [종합 통계] 섹션의 망 기준 계수와 자유도를 검토한 후, 각 개별 관측치 통계를 검토합니다. 개별 기준 계수는 모두 1.0에서 집중되어야 합니다.

  목록 검토시, 일관성이라는 측면을 중시하도록 합니다. 1.0보다 아주 크거나 작은 극단값은 주목을 요합니다. 이상값은 망 조정에서 제거함으로써 개별 기준 계수 통계의 일관성을 제고합니다.

  개별 여유도 수를 보면 각 관측치가 망의 전체 자유도에 기여하는 여유도를 평가할 수 있습니다.

  모든 숫자는 0.00을 초과하고 3.00 이하여야 합니다.

  여유도 수가 3.00에 근접할수록 그 관측치가 망에 기여하는 여유도가 큽니다.

  0.00의 여유도 수는 그 관측치가 다른 한 관측치의 한쪽 끝에만 연결되어 있음을 나타냅니다. 측량 용어로는 이 상태를 사이드샷이라 부릅니다. 의도적으로 이 사이드샷을 만든 것이 아니라면 그 관측치가 망의 전체 여유도에 기여하지 못하는 이유를 규명하도록 합니다.

참조: 사이드샷과 관련된 관측치의 상태는 '점검점으로 이용'으로 설정할 수 있습니다.


    반복 연산 수

추가 정보

 기타

개요

이 필드에 나오는 메시지를 보면 조정 수렴에 성공할 때까지 수행한 반복 연산의 횟수를 알 수 있습니다.

이 메시지를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다.

[반복 연산 수] 필드가 나옵니다.

발생 가능한 모든 메시지:

�# 회 반복 연산에서 조정 성공�

�# 회 반복 연산에서 조정 성공 (최종 수렴 차단 적용)�

(# = 반복 연산 수)

보고서에 표시되는 반복 연산 수는 [조정 스타일 편집] 대화 상자에서 설정한 최대 반복 연산 수를 절대로 초과하지 않습니다.

참조: 망 수렴이 불가능할 경우에는 보고서가 생기지 않습니다.


    조정된 관측치

추가 정보

 기타

개요

조정된 GPS 관측치와 지오이드 관측치에 관한 다음의 정보를 얻으려면 이 통계를 봅니다.

  조정에서 쓴 데이텀

  조정에서 적용한 임계 Tau 값

  관련 사후 표준 (추정) 오차와 잔차, 표준 잔차가 있는 관측치 구성 요소

  이상값 플래그가 붙은 관측치 구성 요소

  관련 추정 오차가 있는 변환 매개 변수 (완전 제약 조정)

  조정에서 쓴 관측치들의 요약, 모든 관측치(GPS, 비GPS, 지오이드)의 목록

관측치(GPS, 비GPS, 지오이드)의 표를 이용하여:

  조정에서 쓴 관측치의 수를 확인합니다.

  각 관측치 구성 요소의 사후 표준 오차를 검토합니다.

  임계 Tau를 초과하는 관측치 구성 요소(이상값)를 찾아냅니다. 문제의 소지가 있는 관측치(이상값)는 빨간색으로 하이라이트가 됩니다.

  매개 변수의 큰 추정 오차 및 잘못된 변환을 찾아냅니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정된 관측치를 클릭합니다.

조정된 관측치의 통계가 나옵니다.

이 섹션은 다음과 같은 부분으로 나뉘어져 있습니다.

  GPS

  비GPS

  지오이드

참조: 망 조정 보고서에서 관측치를 선택하면 이들을 측량 보기 화면에서 선택할 수 있습니다. 방법: 망 조정 보고서로부터 관측치 ID를 선택합니다(여러 관측치를 선택하려면 Ctrl 키를 누름). 선택한 이 관측치가 측량 보기 화면의 현행 선택 부분을 대체합니다.


    포인트 오차 타원

추가 정보

 기타

개요

포인트 오차(수평 및 수직) 크기와 방향의 그래픽적 표현을 보는 통계입니다. 포인트 오차 타원은 그래픽상에서 포인트간 공변항과 조정 포인트의 수평 좌표 사후 표준 오차를 표시합니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 포인트 오차 타원을 클릭합니다.

포인트 오차 타원의 통계가 나옵니다.

고려할 지침 사항:

  타원의 위쪽은 북(N)으로 향합니다.

  타원의 오른쪽 방향 화살표는 고도와 표고의 사후 표준 오차를 의미합니다.

  타원과 화살표를 관통하는 막대바 스케일은 오차의 크기를 나타냅니다.

  막대바 스케일의 틱(tick) 크기는 프로젝트 단위로 표시됩니다. 그래픽 창에서 타원 도구 모음을 이용하면 막대바 스케일에 맞게 틱 값을 조정할 수 있습니다. 이 타원 도구 모음은 망 조정 보고서의 오차 타원 크기에 영향을 미치지 않습니다.

  장반경 축(가장 큰 오차의 방향을 나타내는 축)의 배향각은 타원의 하단 좌측에 표시됩니다. 이 각은 양의 X 축으로부터 시계 반대 방향으로 측정합니다.

  수평 좌표와 수직 좌표의 표준 오차는 2변량 및 단변량 시그마 스칼라로 각각 곱합니다.


    통계 요약

추가 정보

 기타

개요

이것을 이용하면 통계 요약 관련 섹션들을 신속히 살펴볼 수 있습니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다.

통계 요약이 나옵니다.

이것은 조정 결과 분석용으로서 중요한 도구인데 아래와 같은 주요 보고서 섹션들로 구성됩니다.

  반복 연산 수

  종합 통계

  관측치 종류의 통계

  분산 그룹의 통계

  가중 전략

  개별 GPS 관측치 통계

최소 제약 조정을 수행할 때, 전체적인 결과를 분석하기 위하여 '통계 요약'으로(그 중에서도 '종합 통계'로) 곧장 가게 되는 것이 보통입니다. 망이 얼마나 탄탄히 구성되었는지 나타내는 중심 지표는 바로 카이 자승 검정과 망 기준 계수, 자유도 값이기 때문입니다.


    분산 그룹 통계

추가 정보

 기타

개요

각 분산 그룹에 결정된 기준 계수와 여유도 수(자유도)를 봅니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 보고서 헤더가 있습니다.

2.	목차에서 통계 요약을 클릭합니다.

각 관측치 종류에 대한 분산 그룹의 통계를 볼 수 있습니다.

각 분산 그룹의 필드:

그룹 이름

해당 분산 그룹의 이름이 이 필드에 나옵니다.

기준 계수

이 필드에는 각 분산 그룹이 망 기준 계수에 기여하는 정도가 표시됩니다. 모든 분산 그룹은 자체의 추정 오차가 있고, 따라서 자체 기준 계수가 있습니다.

여유도 수

이 필드는 각 분산 그룹이 망의 자유도에 어느 정도 기여하는지 나타냅니다. 이 필드를 이용하여 분산 그룹의 여유도 부족 여부를 파악합니다.


    가중 전략

추가 정보

 기타

개요

이 통계를 보면 GPS 관측치나 지오이드 관측치, 분산 그룹의 집합에 적용된 스케일링 방법과 스칼라 형, 스칼라 값이 올바른지 파악할 수 있습니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 보고서 헤더가 있습니다.

2.	목차에서 가중 전략을 클릭합니다.

가중 전략의 통계가 나옵니다.

GPS 관측치, 비GPS 관측치, 지오이드 관측치, 분산 그룹 등의 각 집합에 대한 요약(제목, 설명 스트링, 스칼라 필드로 구성)이 따로 생깁니다. GPS 관측치에 대한 예시 요약:

GPS 관측치
기본값 스칼라가 모든 관측치에 적용
스칼라: 1.00

상기 예시는 기본 스칼라 값 1.0을 써서 모든 GPS 관측치에 '기본값' 스칼라 형을 적용하였다는 의미합니다. 관측치 그룹의 수가 많고 적음에 따라, 그리고 관측치 집합에 적용하는 가중 전략의 유형에 따라 이 보고서에 여러 가지 조합의 요약이 나올 수 있습니다.

다음은 제목, 스트링, 스칼라 필드의 관계입니다.

제목	·	GPS 관측치
스트링	·	기본값 스칼라가 모든 관측치에 적용
스칼라 필드	·	스칼라: 1.00

제목

상기 예시에서 'GPS 관측치'는 모든 GPS 관측치에 적용된 가중 전략 집합의 제목입니다. 조정에서 쓰는 각 관측치 그룹의 제목이 이 [가중 전략] 섹션에 나오게 됩니다.

스칼라 적용 대상/스칼라 형

각 관측치 집합의 요약에서 처음 나오는 필드는 스트링인데, 이것은 스칼라 적용 방식과 스칼라 형을 나타납니다. 이것은 제목에 이어 바로 나옵니다. 상기 예시의 경우, 제목은 'GPS 관측치'이고 스트링은 '기본값 스칼라가 모든 관측치에 적용'입니다.

이 스트링은 [가중 전략] 대화 상자에서 설정한 스칼라 형과 스칼라 적용 대상으로 구성됩니다. 가능한 스트링 조합:

  기본값 스칼라가 모든 관측치에 적용

  대체 스칼라가 모든 관측치에 적용

  사용자 정의 스칼라가 모든 관측치에 적용

  기본값 스칼라가 각 관측치에 적용

  대체 스칼라가 각 관측치에 적용

  기본값 스칼라가 분산 그룹에 적용

  대체 스칼라가 분산 그룹에 적용

  사용자 정의 스칼라가 분산 그룹에 적용

참조: '자동' 스칼라 형 옵션은 대체 스칼라의 반복 연산을 여러 번 수행합니다. 이 때 조정에 성공하면 이 스트링에 사용자 정의 스칼라가 표시되고, 실패하면(카이 자승 검정에 실패하면) 대체 스칼라가 표시됩니다.

스트링에서의 가중 전략이 올바른지 확인하고 아래의 스칼라 필드를 이용하면, 정확한 스칼라가 관측치나 분산 그룹의 각 집합에 적용되었는지 여부를 결정할 수 있습니다.

스칼라 필드

각 관측치 집합에 적용한 스칼라 값을 나타냅니다. 해당 망 조정에 얼마나 많은 관측치 그룹이 있는지에 따라 이 필드가 보고서에 여러 개 나올 수 있습니다. 각 스트링과 스칼라 값은 해당 관측치 집합에 적용한 가중 전략을 나타냅니다.

이 필드들의 각각을 검토하면 해당 관측치 집합에 적용한 스칼라 값이 무난한 것인지 알 수 있습니다. 여러 관측치 집합에 대하여 다양한 조합의 가중 전략을 정의할 수 있으므로 이 보고서 섹션에는 여러 쌍의 스트링과 스칼라 값이 나올 수 있습니다. 각 필드 집합은 하나의 그룹으로서 검토할 필요가 있습니다.


    그리드 좌표

추가 정보

 기타

개요

마지막 조정에 포함된 각 포인트의 조정 그리드 좌표를 표시하는 통계입니다. 이 좌표는 좌표 구성 요소와 관련된 사후 표준 오차(단변량 시그마 스칼라로 곱함)를 포함합니다. 해당 조정 스타일에서 선택한 단변량 오차가 좌표 목록의 상단에 나옵니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정된 좌표 − 그리드를 클릭합니다.

그리드 좌표의 통계가 나옵니다.

나오는 열:

열	표시 내용
포인트 이름	해당 포인트의 이름
위거	포인트의 조정된 위거 구성 요소(좌표계 단위)
N 오차	조정된 위거 구성 요소의 계산 오차(프로젝트 단위)
경거	포인트의 조정된 경거 구성 요소(좌표계 단위)
E 오차	조정된 경거 구성 요소의 계산 오차(좌표계 단위)
표고	포인트의 조정된 표고 좌표 구성 요소(프로젝트 단위)
표고 오차	조정된 표고 좌표 구성 요소의 계산 오차(프로젝트 단위)
고정	조정에서의 제약된 포인트와 그 제약 좌표 구성 요소. 제약 좌표 구성 요소에는 '수평만'(2D)이나 '수직만'(고도나 표고), '수평 및 수직'이 있습니다.
[고정] 열에는 구성 요소를 나타내는 코드가 나옵니다.

코드	의미
N E	수평 2D
h	고도
e	표고
참조: 제약된 포인트는 모두 좌표 구성 요소와 연관된 사후 표준 오차가 없을 수 있습니다. 이 오차는 0.000으로 표시됩니다. 어떤 구성 요소나 그 관련 사후 오차에 대하여 이용 가능한 값이 없을 경우, 이 열은 '해당 사항 없음'이라고 표시됩니다.


    측지 좌표

추가 정보

 기타

개요

이 통계표를 이용하여, 마지막 조정에 있는 각 포인트의 조정된 측지 좌표를 봅니다. 이 좌표는 각 좌표 구성 요소와 관련된 사후 표준 오차(단변량 시그마 스칼라로 곱함)를 포함합니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정된 좌표 − 측지를 클릭합니다.

측지 좌표의 통계가 나옵니다.

나오는 열:

열	표시 내용
포인트 이름	해당 포인트의 이름
위도	포인트의 조정된 위도 좌표 구성 요소(조정 데이텀)
N 오차	위도 좌표 구성 요소의 계산 오차(프로젝트 단위)
경도	포인트의 조정된 경도 좌표 구성 요소(조정 데이텀)
E 오차	경도 좌표 구성 요소의 계산 오차(프로젝트 단위)
고도	포인트의 조정된 타원체 고도 좌표 구성 요소(프로젝트 단위)
고도 오차	타원체 고도 좌표 구성 요소의 계산 오차(프로젝트 단위)
고정	조정에서의 제약된 포인트와 그 제약 좌표 구성 요소. 제약 좌표 구성 요소에는 '수평만'(2D)이나 '수직만'(타원체 고도나 표고), '수평 및 수직'이 있습니다.
[고정] 열에는 구성 요소를 나타내는 코드가 나옵니다.

코드	의미
위도 경도	수평 2D
H	고도
e	표고
참조: 제약된 포인트는 모두 좌표 구성 요소와 연관된 사후 표준 오차가 없을 수 있습니다. 이 오차는 0.000으로 표시됩니다. 어떤 구성 요소나 그 관련 사후 오차에 대하여 이용 가능한 값이 없을 경우, 이 열은 '해당 사항 없음'이라고 표시됩니다.


    종합 통계

추가 정보

 기타

개요

망이 얼마나 탄탄히 구성되었는지 나타내는 통계입니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다.

종합 통계가 나옵니다.

예시 보고서 섹션:

망 기준 계수 :	6.42
카이 자승 검정 (a=95%) :	불합격
자유도         :	36.00

나오는 필드:

망 기준 계수

이 값을 보면 조정 선험(조정 전) 오차가 사후(조정 후) 오차에 얼마나 잘 일치하는지 알 수 있습니다.

망 기준 계수는 관측치의 우연 오차가 수용 가능한 것인지, 그리고 이것이 그 관측치의 추정 표준 오차에 일치하는지 여부를 파악함에 있어 유용하게 쓰입니다. 이 망 기준 계수는 거의 1.0이어야 합니다.

카이 자승 검정

망이 얼마나 탄탄히 구성되었는지 나타내는 값입니다. 기준 계수가 1.0에 근접하고 자유도가 수용 가능한 수준이며 망이 수학적으로 잘 구성되어 있다면, 카이 자승 검정에 통과하게 됩니다.

최소 자승 조정의 성공에 중요한 요소는 망의 수학적 폐합입니다. 카이 자승 검정을 수학적 폐합의 첫째 지표로 생각하도록 합니다.

자유도

망의 전체 여유도 수을 의미하는 값입니다. 자유도는 해의 과결정에 쓰이는 독립 관측치(조정에 포함된)의 수를 나타냅니다. 그 수가 클수록 망의 여유도가 높습니다.

GPS 관측치와 비GPS 관측치, 지오이드 관측치에 대한 여유도 수는 망의 전체 자유도 값을 결정함에 있어 총체적으로 이용됩니다.


    관측치 종류의 통계

추가 정보

 기타

개요

이 통계를 보면 각 관측치 종류(GPS, 비GPS, 지오이드)에 대하여 결정된 기준 계수(RF)와 여유도 수(자유도)를 알 수 있습니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약을 클릭합니다.

[GPS 관측치 통계]나 [비GPS 관측치 통계], [지오이드 관측치 통계] 섹션이 나옵니다.

지오이드 관측치를 로드한 후에는 [지오이드 모델 통계] 섹션을 이용할 수 있습니다.

자세한 내용은 다음 항목을 참조하십시오.

  GPS 관측치 통계

  비GPS 관측치 통계

  지오이드 모델 통계


    GPS 관측치 통계

추가 정보

 기타

개요

관측치 종류 통계의 [GPS 관측치 통계] 요약에서 GPS 관측치에 대한 기준 계수와 여유도 수(자유도)를 봅니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약 − GPS 관측치를 클릭합니다.

GPS 관측치 종류의 통계가 나오는데 이 섹션의 상단에 GPS 관측치 통계가 있습니다.

나오는 필드:

기준 계수

각 관측치 종류는 자체의 추정 오차가 있고, 따라서 자체 기준 계수가 있습니다. 이 값은 각 관측치 종류가 망 기준 계수에 기여하는 정도를 표시합니다. Trimble Geomatics Office 소프트웨어에서는 각 관측 방식(GPS, 비GPS, 지오이드)을 따로따로 처리함으로써 각 관측치 그룹에 독립적으로 가중치를 부여한 후, 적당한 만큼의 스케일링을 이들의 추정 오차에 적용할 수 있습니다.

여유도 수

여유도 수(자유도라고도 함)는 각 관측치가 전체 여유도에 기여하는 정도를 나타내는 지표입니다. 이 통계를 보면 여유도가 부족한 관측치를 찾아낼 수 있습니다.

GPS 분산 그룹 통계

각 분산 그룹에 나오는 필드:

  그룹 이름

  기준 계수 − 이 필드는 각 분산 그룹이 망 기준 계수에 어느 정도 기여하는지 나타냅니다. 모든 분산 그룹은 자체의 추정 오차가 있고, 따라서 자체 기준 계수가 있습니다.

  여유도 수 − 이 필드는 각 분산 그룹이 망의 자유도에 어느 정도 기여하는지 나타냅니다. 이 필드를 이용하여 분산 그룹의 여유도 부족 여부를 파악합니다.

개별 GPS 관측치 통계

GPS 관측치에 나오는 필드:

  관측치 ID

  기준 계수 − 이 필드는 각 GPS 관측치가 망 기준 계수에 어느 정도 기여하는지 나타냅니다. 모든 GPS  관측치는 자체의 추정 오차가 있고, 따라서 자체 기준 계수가 있습니다.

  여유도 수 − 이 필드는 각 GPS 관측치가 망의 자유도에 어느 정도 기여하는지 나타냅니다. 이 필드를 이용하여 GPS 관측치의 여유도 부족 여부를 파악합니다.


비GPS 관측치 통계

개요

관측치 종류 통계의 [비GPS 관측치 통계] 요약에서 비GPS 관측치에 대한 기준 계수와 여유도 수(자유도)를 봅니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약 − 비GPS 관측치를 클릭합니다.

[비GPS 관측치 통계] 섹션이 나옵니다.

나오는 필드:

기준 계수

각 관측치 종류는 자체의 추정 오차가 있고, 따라서 자체 기준 계수가 있습니다. 이 값은 각 관측치 종류가 망 기준 계수에 기여하는 정도를 표시합니다. Trimble Geomatics Office 소프트웨어에서는 각 관측 방식(GPS, 비GPS, 지오이드)을 따로따로 처리함으로써 각 관측치 그룹에 독립적으로 가중치를 부여한 후, 적당한 만큼의 스케일링을 이들의 추정 오차에 적용할 수 있습니다.

여유도 수

여유도 수(자유도라고도 함)는 각 관측치가 전체 여유도에 기여하는 정도를 나타내는 지표입니다. 이 통계를 보면 여유도가 부족한 관측치를 찾아낼 수 있습니다.

종류별 비GPS 통계

조정에 다음과 같은 종류의 관측치가 있으면 그 기준 계수와 여유도 수가 표시됩니다.

  수평각

  삼각 표고

  타원체 거리

  델타 표고

  방위각

비GPS 분산 그룹 통계

각 분산 그룹에 나오는 필드:

  그룹 이름

  기준 계수 − 이 필드는 각 분산 그룹이 망 기준 계수에 어느 정도 기여하는지 나타냅니다. 모든 분산 그룹은 자체의 추정 오차가 있고, 따라서 자체 기준 계수가 있습니다.

  여유도 수 − 이 필드는 각 분산 그룹이 망의 자유도에 어느 정도 기여하는지 나타냅니다. 이 필드를 이용하여 분산 그룹의 여유도 부족 여부를 파악합니다.


    지오이드 모델 통계

추가 정보

 기타

개요

지오이드 관측치 통계의 요약을 이용하여 지오이드 관측치에 대한 기준 계수와 여유도 수(자유도)를 파악합니다.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 통계 요약 − 지오이드 모델을 클릭합니다.

지오이드 모델 통계가 나옵니다.

나오는 필드:

기준 계수

각 관측치 종류는 자체의 추정 오차가 있고, 따라서 자체 기준 계수(RF)가 있습니다. 이 값은 각 관측치 종류가 망 기준 계수에 기여하는 정도를 표시합니다. Trimble Geomatics Office 소프트웨어에서는 각 관측 방식(GPS, 비GPS, 지오이드)을 따로따로 처리함으로써 각 관측치 그룹에 독립적으로 가중치를 부여한 후, 적당한 만큼의 스케일링을 이들의 추정 오차에 적용할 수 있습니다.

여유도 수

여유도 수(자유도라고도 함)는 각 관측치가 전체 여유도에 기여하는 정도를 나타내는 지표입니다. 이 통계를 보면 여유도가 부족한 관측치를 찾아낼 수 있습니다.


    조정된 GPS 관측치

추가 정보

 기타

개요

<조정된 GPS 관측치> 표의 관측치를 이용하여:

  조정에 쓴 GPS 관측치의 수를 확인합니다.

  각 관측치 구성 요소의 사후 표준 오차를 검토합니다.

  임계 Tau를 초과하는 GPS 관측치 구성 요소(이상값)를 찾아냅니다. 문제의 소지가 있는 관측치는 빨간색으로 하이라이트가 되므로 이상값을 찾아내는 데 도움이 됩니다.

  매개 변수의 큰 추정 오차 및 잘못된 변환을 찾아냅니다.

다음의 필드들이 <조정된 GPS 관측치> 표의 앞에 나올 수 있습니다.

참조: 변환 매개 변수 필드들은 그 매개 변수의 상태를 토대로 하여 보고됩니다. 매개 변수의 상태에 따라 다음과 같은 보고 값이 나옵니다.

  미사용 − 미사용 상태로 설정된 매개 변수는 보고 값이 나오지 않습니다.

  사용자 정의 − 사용자 정의 상태의 매개 변수는 제약된 좌표 구성 요소의 수에 상관없이 사용자가 설정한 값으로 나타납니다.

  계산 − 계산 상태로 설정된 매개 변수는 필요한 수의 좌표 구성 요소를 제약한 후 나타나게 됩니다.

변환 매개 변수의 정의와 계산에 대한 자세한 내용은 변환 매개 변수 - 개요를 참조하십시오.

이 통계를 보려면:

1.	 [보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	 화면 왼쪽의 목차에서 조정된 관측치 − GPS를 클릭합니다.

조정된 GPS 관측치의 통계가 나옵니다.

나오는 필드:

GPS 변환 그룹

조정에 포함된 각 변환 그룹의 이름이 나옵니다. 이 필드는 각 변환 그룹에 대한 보고 정보를 서로 구별하는 표제로서의 기능도 합니다.

경도 편향

경도 편향 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 3개의 고도와 1개의 2D 포인트가 고정되어야 계산, 보고됩니다.

참조: 최소 6개의 고도(3 개 정표고와 3개 타원체 고도)와 1개의 2D 포인트가 고정되어야 하는 지오이드 변환 그룹에서의 경우와는 다릅니다.

위도 편향

위도 편향 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 3개의 고도와 1개의 2D 포인트가 고정되어야 계산, 보고됩니다.

참조: 최소 6개의 고도(3 개 정표고와 3개 타원체 고도)와 1개의 2D 포인트가 고정되어야 하는 지오이드 변환 그룹에서의 경우와는 다릅니다.

방위각 회전

방위각 회전 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 2개의 2D 포인트가 고정되어야 계산, 보고됩니다.

망 축척

망 축척 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 1개의 고도와 2개의 2D 포인트가 고정되어야 계산, 보고됩니다.

거리 축척

거리 축척 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 거리 정오차의 제거에 이용됩니다.

거리 상수

거리 상수 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 거리 정오차의 제거에 이용됩니다.

고도 상수

고도 상수 매개 변수의 값과 추정 오차가 나옵니다. 이 매개 변수는 고도 정오차를 제거합니다.

관측치 갯수

조정에 포함된 GPS 관측치의 총 갯수가 나옵니다.

이상값 갯수

조정에서 발견된 이상값(잔차가 큰 GPS 관측치)의 총 갯수가 나옵니다.

관측치 조정 (임계 Tau = #)

조정에서 적용된 임계 Tau 값이 나옵니다. 이 필드는 <조정된 GPS 관측치> 표의 바로 앞에 나옵니다.

<조정된 GPS 관측치> 표에 있는 열:

열	표시 내용
관측치 ID	프로젝트 관측치에 지정된 레코드 이름. GPS 관측치의 경우, ID 번호의 앞에 "B"자가 붙습니다.
시점	시점의 이름
종점	종점의 이름
관측치	GPS 관측치 구성 요소의 조정된 값
사후 오차(시그마 값)	GPS 관측치 구성 요소의 사후 추정 오차. 해당 조정 스타일에서 설정한 시그마 스칼라가 열 표제에 표시됩니다.
잔차	GPS 관측치 구성 요소의 관측치 잔차
표준 잔차	GPS 관측치 구성 요소의 표준 잔차. 표준 잔차를 이용하면 각도 측정치의 오차와 선형 측정치의 오차를 직접적으로 비교할 수 있습니다.


조정된 비GPS 관측치

추가 정보

 기타

개요

<조정된 비GPS 관측치> 표의 관측치를 이용하여:

  조정에 쓴 비GPS 관측치의 수를 확인합니다.

  각 관측치 구성 요소의 사후 표준 오차를 검토합니다.

  임계 Tau를 초과하는 비GPS 관측치 구성 요소(이상값)를 찾아냅니다. 문제의 소지가 있는 관측치는 빨간색으로 하이라이트가 되므로 이상값을 찾아내는 데 도움이 됩니다.

  매개 변수의 큰 추정 오차 및 잘못된 변환을 찾아냅니다.

다음의 필드들이 <조정된 비GPS 관측치> 표의 앞에 나올 수 있습니다.

참조: 변환 매개 변수 필드들은 그 매개 변수의 상태를 토대로 하여 보고됩니다. 매개 변수의 상태에 따라 다음과 같은 보고 값이 나옵니다.

  미사용 − 보고 값이 나오지 않습니다.

  사용자 정의 − 제약된 좌표 구성 요소의 수에 상관없이 사용자가 설정한 값으로 나타납니다.

  계산 − 필요한 수의 좌표 구성 요소를 제약한 후 나타나게 됩니다.

변환 매개 변수의 정의와 계산에 대한 자세한 내용은 변환 매개 변수 - 개요를 참조하십시오.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정된 관측치 − 비GPS를 클릭하면 조정된 관측치의 통계가 나옵니다.

나오는 필드:

비GPS 변환 그룹

조정에 포함된 각 변환 그룹의 이름이 나옵니다. 이 필드는 각 변환 그룹에 대한 보고 정보를 서로 구별하는 표제로서의 기능도 합니다.

경도 편향

경도 편향 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 3개의 고도와 1개의 2D 포인트가 고정되어야 계산, 보고됩니다.

참조: 최소 6개의 고도(3 개 정표고와 3개 타원체 고도)와 1개의 2D 포인트가 고정되어야 하는 지오이드 변환 그룹에서의 경우와는 다릅니다.

위도 편향

위도 편향 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 3개의 고도와 1개의 2D 포인트가 고정되어야 계산, 보고됩니다.

참조: 최소 6개의 고도(3 개 정표고와 3개 타원체 고도)와 1개의 2D 포인트가 고정되어야 하는 지오이드 변환 그룹에서의 경우와는 다릅니다.

방위각 회전

방위각 회전 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 2개의 2D 포인트가 고정되어야 계산, 보고됩니다.

망 축척

망 축척 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 1개의 고도와 2개의 2D 포인트가 고정되어야 계산, 보고됩니다.

거리 축척

거리 축척 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 거리 정오차의 제거에 이용됩니다.

거리 상수

거리 상수 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 거리 정오차의 제거에 이용됩니다.

고도 상수

고도 상수 매개 변수의 값과 추정 오차가 나옵니다. 이 매개 변수는 고도 정오차를 제거합니다.

관측치 갯수

조정에 포함된 비GPS 관측치의 총 갯수가 나옵니다.

이상값 갯수

조정에서 발견된 이상값(잔차가 큰 비GPS 관측치)의 총 갯수가 나옵니다.

관측치 조정 (임계 Tau = #)

조정에서 적용된 임계 Tau 값이 나옵니다. 이 필드는 <조정된 비GPS 관측치> 표의 바로 앞에 나옵니다.

<조정된 비GPS 관측치> 표에 있는 열:

열	표시 내용
관측치 ID	프로젝트 관측치에 지정된 레코드 이름. 비GPS 관측치의 경우, ID 번호의 앞에 T 자가 붙습니다.
후시점	후시점의 이름
선점 포인트	선점 포인트의 이름
전시점 관측치	전시점의 이름 비GPS 관측치 구성 요소의 조정된 값
사후 오차(시그마 값)	비GPS 관측치 구성 요소의 사후 추정 오차. 해당 조정 스타일에서 설정한 시그마 스칼라가 열 표제에 표시됩니다.
잔차	비GPS 관측치 구성 요소의 관측치 잔차
표준 잔차	비GPS 관측치 구성 요소의 표준 잔차. 표준 잔차를 이용하면 각도 측정치의 오차와 선형 측정치의 오차를 직접적으로 비교할 수 있습니다.


    조정된 지오이드 관측치

추가 정보

 기타

개요

조정된 지오이드 관측치에 대한 다음 정보를 검토하려면 이 통계를 이용합니다.

  조정에서 적용한 임계 Tau 값

  관련 사후 표준 (추정) 오차와 잔차, 표준 잔차가 있는 지오이드 관측치

  빨간색의 이상값 플래그가 붙은 지오이드 관측치

  관련 추정 오차가 있는 변환 매개 변수 (완전 제약 조정)

  조정에서 쓴 지오이드 관측치들의 요약, 모든 지오이드 관측치에 관한 정보가 수록된 표

<조정된 지오이드 관측치> 표의 관측치들을 이용하여:

  조정에서 쓴 지오이드 관측치의 수를 확인합니다.

  각 관측치의 사후 표준 오차를 검토합니다.

  임계 Tau를 초과하는 지오이드 관측치(이상값)를 찾아냅니다. 문제의 소지가 있는 관측치(이상값)는 빨간색으로 하이라이트가 되므로 이상값을 찾아내는 데 도움이 됩니다.

  매개 변수의 큰 추정 오차 및 잘못된 변환을 찾아냅니다.

다음의 필드들이 <조정된 지오이드 관측치> 표의 앞에 나올 수 있습니다.

참조: 변환 매개 변수 필드들은 그 매개 변수의 상태를 토대로 하여 보고됩니다. 매개 변수의 상태에 따라 다음과 같은 보고 값이 나옵니다.

  미사용 − 보고 값이 나오지 않습니다.

  사용자 정의 − 제약된 좌표 구성 요소의 수에 상관없이 사용자가 설정한 값으로 나타납니다.

  계산 − 필요한 수의 좌표 구성 요소를 제약한 후 나타나게 됩니다.

변환 매개 변수의 정의와 계산에 대한 자세한 내용은 변환 매개 변수 - 개요를 참조하십시오.

이 통계를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정된 관측치 − 지오이드를 클릭하면 조정된 지오이드 관측치의 통계가 나옵니다.

나오는 필드:

지오이드 변환 그룹

조정에 포함된 지오이드 변환 그룹의 이름이 나옵니다. 기본 변환 그룹만 있으므로 항상 <지오이드 기본값> 변환 그룹이 표시됩니다.

경도 편향

경도 편향 매개 변수의 값과 추정 오차가 나옵니다. 지오이드 변환 그룹의 경우, 이 값은 최소 최소 6개의 고도(3 개 정표고와 3개 타원체 고도)와 1개의 2D 포인트가 고정되어야 계산, 보고됩니다. 최소 3개의 고도와 1개의 2D 포인트가 고정되어야 하는 GPS 변환 그룹에서의 경우와는 다릅니다.

위도 편향

위도 편향 매개 변수의 값과 추정 오차가 나옵니다. 지오이드 변환 그룹의 경우, 이 값은 최소 최소 6개의 고도(3 개 정표고와 3개 타원체 고도)와 1개의 2D 포인트가 고정되어야 계산, 보고됩니다. 최소 3개의 고도와 1개의 2D 포인트가 고정되어야 하는 GPS 변환 그룹에서의 경우와는 다릅니다.

고도 상수

고도 상수 매개 변수의 값과 추정 오차가 나옵니다. 이 값은 최소 1개의 표고와 1개의 고도가 고정되어야 계산, 보고됩니다.

참조: 방위각 회전, 망 축척, 거리 축척, 거리 상수 등의 매개 변수는 지오이드고 변환시에는 쓰이지 않습니다.

관측치 갯수

조정에 포함된 지오이드 관측치의 총 갯수가 나옵니다.

이상값 갯수

조정에서 발견된 이상값(잔차가 큰 GPS 관측치)의 총 갯수가 나옵니다.

관측치 조정 (임계 Tau = #)

조정에서 적용된 임계 Tau 값이 나옵니다. 이 필드는 <조정된 지오이드 관측치> 표의 바로 앞에 나옵니다.

<조정된 지오이드 관측치> 표에 있는 열:

열	표시 내용
관측치 ID	프로젝트 지오이드 관측치에 지정된 레코드 이름. 지오이드 관측치의 경우, ID 번호의 앞에 G 자가 붙습니다.
포인트 이름	지오이드 모델에서 지오이드 관측치를 추출함에 이용한 포인트의 이름
분리 간격	조정되는 값
사후 오차(시그마 값)	사후 추정 오차. 해당 조정 스타일에서 설정한 시그마 스칼라가 열 표제에 표시됩니다.
잔차	관측치 잔차
표준 잔차	표준 잔차. 표준 잔차를 이용하면 각도 측정치의 오차와 선형 측정치의 오차를 직접적으로 비교할 수 있습니다.
참조: 지오이드의 상관도가 계산되면 조정된 분리 간격은 모두 잔차를 갖게 됩니다. 상관도가 계산되지 않으면 수직 제약 조건이 있는 포인트만 지오이드 잔차를 갖게 됩니다.


조정 스타일 설정

개요

보고서의 이 섹션에는 망 조정에 대한 설정의 요약이 나옵니다. 조정 스타일 설정을 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 조정 스타일 설정을 클릭합니다.

다음과 같은 조정 스타일 설정이 나옵니다.

잔차 허용 범위

다음 값에 대한 설정입니다.

  반복 연산 종료

  최종 수렴 차단

공분산 표시

다음과 같은 수평 오차 매개 변수의 정보가 나옵니다.

  전파 선형 오차 [E]

  상수항 [C]

  선형 오차 축척 [S]

3차원 매개 변수의 관련 정보가 나옵니다.

  전파 선형 오차 [E]

  상수항 [C]

  선형 오차 축척 [S]

이 섹션은 [가능한 경우 표고 오차 적용] 옵션이 선택되었는지 여부도 표시합니다.

조정 제어

표시 정보:

  지오이드의 상관도 계산

  수평 조정이나 수직 조정(또는 둘 다)을 수행하였는지 여부

참조: 이 섹션은 조정에 비GPS 관측치가 포함되어 있는 경우에만 나옵니다.

설치 오차

표시되는 GPS 설치 오차:

  안테나 높이 오차

  센터링 오차

표시되는 비GPS 설치 오차:

  기계고 오차

  센터링 오차

참조: 비GPS 설치 오차는 조정에 비GPS 관측치가 포함되어 있는 경우에만 표시됩니다.

설치 오차 설정에 대한 자세한 내용은 설치 오차를 참조하십시오.


[망 조정 보고서 설정] 대화 상자

개요

이 대화 상자를 이용하여 망 조정 보고서에 표시되는 정보를 선택합니다.

방법:

  [보고서 / 설정 / 망 조정 보고서]를 선택합니다. [망 조정 보고서 설정] 대화 상자가 나옵니다.

망 조정 보고서에 표시할 수 있는 항목:

  개별 GPS 관측치 통계

  조정된 그리드 좌표

  조정된 측지 좌표

  좌표 델타

  기준 좌표 비교

  포인트 오차 타원

  공변항

참조: 큰 프로젝트의 경우, 포인트 오차 타원이나 공변항의 화면 출력은 시간이 많이 걸립니다. [망 조정 보고서 설정] 대화 상자에서 이 옵션들을 해제하면 보다 신속한 보고서 작업이 가능해집니다.


기준 좌표 비교

개요

제약되지 않은 기준 등급 좌표가 있는 포인트에 조정을 수행하면 망 조정 보고서는 제약되지 않은 이 기준점 좌표와 조정된 기준점 좌표와의 차이를 표시합니다.

기준 좌표 비교를 보려면:

1.	[보고서 / 망 조정 보고서] 명령을 실행하면 기본 HTML 뷰어가 뜨면서 망 조정 보고서가 나옵니다. 그 상단에는 조정 헤더가 있습니다.

2.	화면 왼쪽의 목차에서 기준 좌표 비교를 클릭합니다.

<기준 좌표 비교> 표에 나오는 필드:

포인트 이름

기준 등급 포인트의 이름

델타 값

제약되지 않은 기준 좌표와 조정된 기준 좌표의 차이는 다음 항목에 대하여 표시됩니다.

  델타 위거

  델타 경거

  델타 표고

  델타 고도

참조: 차이 계산 방식:

기준 좌표 차 = 기준 좌표 − 조정된 좌표


    [조정] 명령

추가 정보

방법 ...	기타
개요

이 명령을 써서 망 조정을 수행합니다.

이 명령을 실행하기 전에 모든 조정 스타일 설정이 올바르게 되어 있는지, 기준점 좌표가 설정되어 있는지, 그리고 이용 가능한 관측치가 있는지 확인하도록 합니다.

망 조정을 수행하려면,

  [조정 / 조정] 명령을 실행하거나

  F10을 누릅니다.

조정이 시작됩니다.

망 조정의 반복 연산(Iteration)이 1 회씩 끝날 때마다 소프트웨어의 서로 다른 두가지 루틴을 바탕으로 관측 잔차가 계산됩니다. 이 두 계산의 차이값은 '반복 연산 종료 허용 편차'와 비교되는데, 이 때:

  계산 관측 잔차간의 차이가 '반복 연산 종료 허용 편차'보다 작으면 조정 반복 연산 작업이 중지됩니다. 망 조정 보고서에 �# 회 반복 연산에서 조정 성공� 이라는 메시지가 나옵니다. 여기서 #는 이 망의 수렴에 필요했던 반복 연산의 수입니다.

  계산 관측 잔차간의 차이가 '반복 연산 종료 허용 편차'보다 크면 조정 반복 연산 작업이 계속됩니다. '최대 반복 연산 수'에 도달할 때까지 조정 작업이 계속되면 '최종 수렴 차단'이 적용됩니다(아래 참조).

망 조정의 최종 반복 연산에 대한 '수렴 차단 허용 편차'를 입력합니다. 이 값은 마지막 반복 연산 작업이 '반복 연산 종료 허용 편차'를 통과하지 못할 경우, 소프트웨어가 망 조정의 성공 여부를 판단함에 이용합니다.

마지막 반복 연산에 대한 관측 잔차의 계산 차이값이 '반복 연산 종료 허용 편차'보다 크면 그 잔차는 '최종 수렴 차단'과 비교되는데, 이 때:

 계산 관측 잔차간의 차이가 '최종 수렴 차단'보다 작으면 망 조정이 성공입니다. 망 조정 보고서에 �# 회 반복 연산 후 최종 수렴 성공(최종 수렴 차단 적용)�이라는 메시지가 나옵니다. 여기서 #는 이 망의 수렴에 필요했던 반복 연산의 수입니다.

 이 관측 잔차가 '최종 수렴 차단'보다 크면 망 조정이 실패이므로 "조정 실패. 수렴 안됨"이라는 경고 메시지가 나옵니다.

망 조정 과정에 대한 자세한 내용은 망 조정을 참조하십시오.

망 조정 과정에서 수행되는 반복 연산 작업과 계산에 대해서는 잔차 허용 범위를 참조하십시오.


    [조정 스타일] 명령

추가 정보

방법 ...	대화 상자	기타
개요

이 명령을 이용하여 조정 스타일을 보거나 복사, 편집, 이름 변경, 삭제 작업을 합니다.

[망 조정 스타일] 대화 상자를 불러오려면

  [조정 / 조정 스타일] 명령을 실행합니다.


    [데이텀] 명령

추가 정보

방법 ...	기타
개요

조정에 쓰는 데이텀을 선택하는 명령입니다.

[데이텀]의 하위 메뉴를 보려면:

  [조정 / 데이텀] 명령을 선택합니다.

다음 명령이 이 하위 메뉴에 나옵니다.

  WGS-84

  프로젝트 데이텀


    [관측치 그룹] 명령

추가 정보

방법 ...	대화 상자	기타
개요

망 조정에 쓰는 분산 그룹과 변환 그룹을 정의하는 명령입니다.

[관측치 그룹]의 하위 메뉴를 보려면:

  [조정 / 관측치 그룹] 명령을 선택합니다.

다음 명령이 이 하위 메뉴에 나옵니다.

  분산 그룹

  변환 그룹


    [망 조정 보고서] 명령

추가 정보

방법 ...	보고서	기타
개요

망 조정 보고서를 보는 명령입니다.

망 조정 보고서를 보려면:

  [보고서 / 망 조정 보고서] 명령을 실행합니다. 시스템의 기본 HTML 뷰어가 자동 실행되면서 HTML 포맷의 보고서가 나옵니다.

이 보고서에 대한 자세한 내용은 망 조정 보고서를 참조하십시오.


    [관측치] 명령

추가 정보

방법 ...	대화 상자	기타
개요

관측치를 보고 검토하는 명령입니다. 이 명령을 이용하여 관측치를 망 조정에 포함시키거나 망 조정으로부터 제외할 수도 있습니다.

[관측치] 대화 상자를 불러오려면,

  [조정 / 관측치] 명령을 실행합니다.


    [포인트] 명령

추가 정보

방법 ...	대화 상자	기타
개요

[포인트] 대화 상자를 불러오는 명령입니다. 망 조정에 쓰이는 기준점 좌표 구성 요소의 고정(Fix) 상태를 보거나 설정, 해제하는 옵션이 있습니다.

[포인트] 대화 상자를 불러오려면

  [조정 / 포인트] 명령을 실행합니다.


    [프로젝트 데이텀] 명령

추가 정보

방법 ...	기타
개요

프로젝트 데이텀을 망 조정 데이텀으로 선택하는 명령입니다. 프로젝트 데이텀은 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭 하에서 설정하는데 비GPS 데이터에 대한 완전 제약 조정이나 최소 제약 조정을 수행할 때 씁니다.

프로젝트 데이텀의 선택 방법:

  [조정 / 데이텀 / 프로젝트 데이텀 − <데이텀>]을 선택합니다. 체크 표가 [프로젝트 데이텀 − <데이텀>] 옆에 나옵니다.


    [조정 제거] 명령

추가 정보

방법 ...	기타
개요

현재의 조정을 제거하는 명령입니다.

조정된 값을 제거하려면:

  [조정 / 조정 제거] 명령을 선택합니다.

이 옵션을 쓰면 망의 설정을 조정 전 상태대로 되돌리게 됩니다. 예를 들어, 이 명령을 실행하면:

  데이텀이 WGS-84로 설정됩니다.

  고정 상태인 포인트가 하나도 없게 됩니다.

  오차 타원이 제거됩니다.

  지오이드 관측치가 언로드 됩니다.

  스칼라가 '모든 관측치'와 '기본값' 옵션으로 재설정됩니다.

참조: 망 조정에의 이용이 해제된 관측치와  [망 조정에 이용] 확인란이 선택 해제된 관측치는 이전 상태로 재설정되지 않습니다.


    [변환 그룹] 명령

추가 정보

방법 ...	대화 상자	기타
개요

망 조정에 쓰는 관측치 변환 그룹을 정의하는 명령입니다.

[변환 그룹] 대화 상자를 불러오려면

  [조정 / 관측치 그룹 / 변환 그룹] 명령을 실행합니다.


    [분산 그룹] 명령

추가 정보

방법 ...	대화 상자	기타
망 조정에 쓰는 관측치 분산 그룹을 정의하는 명령입니다.

[분산 그룹] 대화 상자를 불러오려면:

  [조정 / 관측치 그룹 / 분산 그룹] 명령을 실행합니다.


    [WGS-84] 명령

추가 정보

방법 ...	기타
개요

WGS-84를 망 조정 데이텀으로 쓰는 명령입니다. GPS 관측치에 대한 최소 제약 조정을 수행할 경우에는 WGS-84 데이텀을 써야 합니다.

WGS-84 데이텀의 선택 방법:

  [조정 / 데이텀 / WGS-84] 명령을 실행합니다. 체크 표가 [WGS-84] 옆에 나옵니다.


    [가중 전략] 명령

추가 정보

방법 ...	대화 상자	기타
개요

[가중 전략] 대화 상자를 불러오는 명령입니다. 이 대화 상자에는 망 조정에 쓰는 스칼라 가중 전략의 정의와 적용에 대한 옵션이 있습니다.

[가중 전략] 대화 상자를 보려면,

  [조정 / 가중 전략] 명령을 실행합니다.


    [저장] 명령 (캘리브레이션 좌표)

추가 정보

방법 ...	대화 상자	기타
개요

최소 제약 GPS 조정을 수행한 후, 캘리브레이션 좌표를 저장하는 명령입니다. 캘리브레이션 좌표는 최소 제약 조정 과정에서 도출되는 WGS-84 위도, 경도 및 타원체 고도로 구성됩니다.

이 좌표는 Trimble Geomatics Office 소프트웨어에서 사이트 캘리브레이션을 수행할 때 GPS 좌표로서 이용하게 됩니다.

[캘리브레이션 좌표 저장] 대화 상자를 불러오려면:

  [조정 / 캘리브레이션 좌표 / 저장] 명령을 실행합니다.

참조: 망 조정에 프로젝트 데이텀을 이용하고 있거나, 또는 비GPS 데이터가  망 조정에 있는 경우에는 이 명령을 쓸 수 없습니다.

참조: 캘리브레이션 좌표을 저장할 때 해당 포인트에 대하여 WGS-84 캘리브레이션 좌표가 저장됩니다.


    [제거] 명령 (캘리브레이션 좌표)

추가 정보

방법 ...	기타
개요

캘리브레이션 좌표는 WGS-84 데이텀의 최소 제약 GPS 조정 과정에서 도출되는 WGS-84 위도, 경도 및 타원체 고도입니다.  이 명령은 프로젝트로부터 캘리브레이션 좌표를 제거할 때 이용합니다.

  [조정 / 캘리브레이션 좌표 / 제거] 명령을 선택합니다.


    [관측치 불이용] 명령

추가 정보

방법 ...	대화 상자	기타
개요

조정 관측치의 목록에 나오는 어떤 관측치를 완전히 이용 해제하고자 할 때 쓰는 명령입니다. 해당 관측치는 목록에서 제거되고 망 조정이나 재계산에 더 이상 쓰이지 않게 됩니다.

참조: 관측치의 이용 해제는 관측치를 제외하는 것과는 다릅니다. 제외된 관측치는 망 조정이나 재계산에서는 처리되지 않지만 [관측치] 목록에는 계속 나옵니다.

관측치의 이용 해제 방법:

1.	[조정 / 관측치] 명령을 실행합니다. [관측치] 대화 상자가 나옵니다.

2.	불이용 처리하고자 하는 관측치를 마우스의 오른쪽 단추로 누른 다음, 나오는 바로 가기 메뉴에서 [관측치 불이용]을 선택합니다.

이 관측치는 [관측치] 목록에서 제거되고 망 조정이나 재계산에 더 이상 쓰이지 않게 됩니다 .

이용 해제한 관측치를 [관측치] 대화 상자에서는 이용 상태로 재설정할 수 없습니다. 그 대신, 그래픽 창에서 해당 관측치를 선택한 다음, 이용 해제된 속성을 이용 상태로 재설정합니다.즉, 그 상태를 '불이용'에서 '이용'으로 변경하면 됩니다.


    [캘리브레이션 좌표] 명령

추가 정보

방법 ...	대화 상자	기타
개요

캘리브레이션 좌표를 저장하고 제거하는 하위 메뉴를 불러오는 명령입니다.

하위 메뉴를 불러오려면:

  [조정 / 캘리브레이션 좌표] 명령을 선택합니다.

이 하위 메뉴에는 다음의 명령이 있습니다.

  저장

  제거


    [캘리브레이션 좌표 저장] 대화 상자

추가 정보

방법 ...	기타
개요

이 대화 상자를 이용하여 캘리브레이션 좌표의 저장 방식을 정합니다.

참조: 이 옵션은 조정 데이텀이 WGS-84로 설정되어 있고, 조정한 대상이 GPS 관측치뿐인 경우에만 이용할 수 있습니다.

이 대화 상자를 불러오려면

  [조정 / 캘리브레이션 좌표 / 저장]을 선택합니다.

[캘리브레이션을 위한 좌표 저장] 상자에서의 두가지 옵션:

기존 포인트

이 옵션을 쓰면 '캘리브레이션 세트'라 부르는 추가 좌표로서 저장이 됩니다.

접미어가 붙은 새 포인트

'GPS'를 접미어로 해서 저장하면 포인트 이름이 '<포인트 이름 >-GPS'인 새 포인트 레코드가 만들어집니다. 이 캘리브레이션 좌표를 저장하기 이전에 접미어 'GPS'를 다른 것으로 바꿀 수 있습니다.

자세한 내용은 캘리브레이션 좌표 저장하기를 참조하십시오.


    타원 제어 도구 모음

추가 정보

방법 ...	기타
개요

이 도구 모음을 이용하면 조정 후 그래픽 창에 나오는 오차 타원, 고도 오차 화살표, 표고 오차 화살표를 필터링 할 수 있습니다. 오차 타원의 크기를 스케일링하고 틱 표의 크기를 조정할 수도 있습니다.

이 도구 모음을 보려면:

  측량 보기 화면에서 [보기 / 도구 모음 / 타원 제어] 명령을 실행합니다.

  측량 보기 화면의 도구 모음 영역에서 마우스의 오른쪽 누르기를 한 후, [타원 제어]를 선택합니다.

타원 제어 도구 모음이 나옵니다. 상기 명령을 다시 실행하면 이 도구 모음이 숨겨집니다.

참조: [보기 옵션] 대화 상자의 [오차 타원 제어] 탭을 이용하여 오차 타원의 표시 형식을 제어할 수도 있습니다.

이 도구 모음에 있는 도구 단추:

	이 단추는 [오차 타원] 명령을 토글합니다. 이 명령을 토글하는 것은 [보기 옵션] 대화 상자의 [포인트 오차 타원과 화살표 표시] 확인란을 선택했다 선택 해제하는 것과 마찬가지입니다. 이 단추를 눌러 활성화하면 [고도 오차]와 [표고 오차] 명령(단추)도 활성화됩니다.
	이 단추는 [고도 오차] 명령을 토글하는데, [오차 타원] 명령이 활성화되어 있는 경우에만 이용할 수 있습니다.
	이 단추는 [표고 오차] 명령을 토글하는데, [오차 타원] 명령이 활성화되어 있는 경우에만 이용할 수 있습니다.

그 외, 다음과 같은 제어 도구도 있습니다.

오차 타원 배율

이 제어기는 조정 후 그래픽 창에 나오는 오차 타원의 크기를 조절합니다.

타원의 크기는 슬라이더를 왼쪽으로 이동하면 작아지고 오른쪽으로 이동하면 커집니다.

틱 표 크기

이 제어기는 오차 타원의 막대바 스케일 틱 거리를 조정합니다.

그래픽 창에 나오는 틱 표 사이의 거리를 이 스핀 단추로써 조정합니다. 막대바 스케일은 틱 표 크기(Size of Tick Marks)가 커질수록 길어지는데, 이 제어기에 표시되는 값에 어울리게 틱 표간 거리가 적절히 조정됩니다. 막대바 스케일 틱 설정이 작아지면 이와 반대로 됩니다.


    [타원 제어] 명령

추가 정보

방법 ...	기타
개요

이 명령을 실행함으로써 타원 제어 도구 모음을 숨기거나 표시합니다.

타원 제어 도구 모음을 숨기거나 표시하려면,

  [보기 / 도구 모음 / 타원 제어] 명령을 선택합니다.

이 명령을 실행할 때마다 타원 제어 도구 모음이 나오거나 사라집니다.

참조: [보기 옵션] 대화 상자의 [오차 타원 제어] 탭을 이용함으로써 오차 타원 제어 옵션을 설정할 수도 있습니다.


    [오차 타원] 명령

추가 정보

방법 ...	기타
개요

[오차 타원] 명령은 타원 제어 도구 모음에 있습니다. 이 명령은 조정 후 그래픽 창에 나오는 오차 타원과 화살표를 필터링 합니다. 이 명령을 선택하면 타원 제어 도구 모음의 [고도 오차]와 [표고 오차] 명령 단추가 활성화 됩니다.

참조: [오차 타원] 명령은 [보기 옵션] 대화 상자의 [포인트 오차 타원과 화살표 표시] 확인란을 선택하는 것과 마찬가지입니다. 이 확인란의 상태를 변경하는 것도 현재의 [오차 타원] 단추 설정을 바뀌게 합니다. 자세한 내용은 오차 타원과 화살표 필터링 하기를 참조하십시오.

[오차 타원] 명령을 선택하려면:

1.	타원 제어 도구 모음을 표시합니다.

자세한 내용은 타원 제어 도구 모음 표시하기/숨기기를 참조하십시오.

2.	오차 타원과 화살표를 필터링 하려면 [image] 을 누릅니다.

오차 타원은 이 단추를 누르기 직전의 상태가 어떠했냐에 따라 숨겨지기도 하고 나타나기도 합니다. [오차 타원] 단추를 선택하면 [고도 오차]와 [표고 오차] 단추를 이용할 수 있게 됩니다. 고도 오차와 표고 오차 화살표 도구 모음를 선택하면 고도 화살표 또는(및) 표고 화살표도 표시됩니다.


    [고도 오차] 명령

추가 정보

방법 ...	기타
개요

이 명령을 선택함으로써, 조정 후 그래픽 창에 나오는 고도 오차 화살표를 필터링 합니다,

참조: 이 명령은 먼저 타원 제어 도구 모음의 [오차 타원] 명령이나 [보기 옵션] 대화 상자의 [포인트 오차 타원과 화살표 표시] 확인란을 선택하여야만 이용할 수 있습니다.

[고도 오차] 명령을 선택하려면:

1.	타원 제어 도구 모음을 표시합니다.

2.	오차 타원과 화살표를 필터링 하려면 [image] 단추를 누릅니다. 오차 타원은 이 단추를 누르기 직전의 상태가 어떠했냐에 따라 숨겨지기도 하고 나타나기도 합니다. [오차 타원] 단추를 선택하면 [고도 오차] 단추를 이용할 수 있게 됩니다.

3. 타원 제어 도구 모음에서 [image] 를 누릅니다.

이 단추를 누를 때마다 고도 화살표가 나오거나 사라집니다.


    [표고 오차] 명령

추가 정보

방법 ...	기타
개요

이 명령을 선택함으로써, 조정 후 그래픽 창에 나오는 표고 오차 화살표를 필터링 합니다,

참조: 이 명령은 먼저 타원 제어 도구 모음의 [오차 타원] 명령이나 [보기 옵션] 대화 상자의 [포인트 오차 타원과 화살표 표시] 확인란을 선택하여야만 이용할 수 있습니다.

[표고 오차] 명령을 선택하려면:

1.	타원 제어 도구 모음을 표시합니다.

자세한 내용은 타원 제어 도구 모음 표시하기/숨기기를 참조하십시오.

2.	오차 타원과 화살표를 필터링 하려면 [image] 단추를 누릅니다. 오차 타원은 이 단추를 누르기 직전의 상태가 어떠했냐에 따라 숨겨지기도 하고 나타나기도 합니다. [오차 타원] 단추를 선택하면 [표고 오차] 단추를 이용할 수 있게 됩니다.

3.	타원 제어 도구 모음에서 [image] 를 누릅니다.

이 단추를 누를 때마다 표고 화살표가 나오거나 사라집니다.


타원 제어 도구 모음 표시하기/숨기기

 개요 및 추가 정보

개요

타원 제어 도구 모음을 이용함으로써 그래픽 창에 나오는 오차 타원과 화살표의 크기 및 표시 형식을 설정합니니다.

이 도구 모음을 보려면:

  측량 보기 화면에서 [보기 / 도구 모음 / 타원 제어] 명령을 실행하거나,

  측량 보기 화면의 도구 모음 영역에서 마우스의 오른쪽 누르기를 한 후, [타원 제어]를 선택합니다.

타원 제어 도구 모음이 나타납니다.


오차 타원의 표시 크기 변경하기

개요

그래픽 창에 나오는 오차 타원의 크기는 늘리거나 줄일 수 있습니다.

오차 타원의 크기를 변경하려면,

1.	타원 제어 도구 모음을 표시합니다.

자세한 내용은 타원 제어 도구 모음 표시하기/숨기기를 참조하십시오.

2.	[오차 타원 배율]에서 다음 중 하나를 실행합니다.

  타원의 크기를 줄이려면 슬라이더를 왼쪽으로 옮깁니다.

  타원의 크기를 늘리려면 슬라이더를 오른쪽으로 옮깁니다.

오차 타원의 크기가 조절됩니다.


오차 타원 막대바 스케일 틱 조정하기

개요

오차 타원 막대바 스케일의 틱 거리는 타원 제어 도구 모음에서 조정할 수 있습니다.

조정 방법:

1.	타원 제어 도구 모음을 표시합니다.

자세한 내용은 타원 제어 도구 모음 표시하기/숨기기를 참조하십시오.

2.	틱 표 크기 제어기에서 다음 중 하나를 실행합니다.

  틱 거리를 줄이려면 아래쪽 스핀 단추를 누릅니다.

  틱 거리를 늘리려면 위쪽 스핀 단추를 누릅니다.

막대바 스케일은 틱 표 크기가 커질수록 길어지는데, 이 제어기에 표시되는 값에 어울리게 틱 표간 거리가 적절히 조정됩니다. 막대바 스케일 틱 설정이 작아지면 이와 반대로 됩니다.


오차 타원과 화살표 필터링 하기

추가 정보

기타	방법 ...
개요

조정 후, 그래픽 창에 나오는 오차 타원과 화살표는 타원 제어 도구 모음이나 [보기 옵션] 대화 상자를 이용하여 필터링 할 수 있습니다.

참조: [보기 옵션] 대화 상자의 [포인트 오차 타원과 화살표 표시] 확인란과 타원 제어 도구 모음의 [오차 타원] 단추는 상호 연관되어 있습니다. 둘 중 어느 하나의 설정을 토글하면 다른 것에 영향을 미칩니다. 타원 제어 도구 모음을 이용하는 편이 더 나은데, 자세한 사항은 타원 제어 도구 모음을 참조하십시오.

타원 제어 도구 모음으로 오차 타원과 화살표를 필터링 하는 방법:

1.	타원 제어 도구 모음을 표시합니다.

2.	오차 타원과 화살표를 필터링 하려면 [image] 을 누릅니다. 오차 타원은 이 단추를 누르기 직전의 상태가 어떠했냐에 따라 숨겨지기도 하고 나타나기도 합니다. [오차 타원] 단추를 선택하면 [고도 오차]와 [표고 오차] 단추를 이용할 수 있게 됩니다. 고도 오차와 표고 오차 화살표 도구 모음를 선택하면 고도 화살표 또는(및) 표고 화살표도 표시됩니다.

3.	타원 제어 도구 모음에서 다음을 실행합니다.

  고도 화살표를 필터링 하려면 [image] 을 누릅니다.

  표고 화살표를 필터링 하려면 [image] 을 누릅니다.

이 단추를 누를 때마다 고도 화살표/표고 화살표가 나오거나 사라집니다.

[보기 옵션] 대화 상자에서 오차 타원과 화살표를 필터링 하는 방법:

1. [보기 / 옵션] 명령을 실행하여 [보기 옵션] 대화 상자를 불러옵니다.

2.	[오차 타원 제어] 탭을 선택합니다.

3.	[포인트 오차 타원과 화살표 표시] 확인란을 선택합니다.

이 확인란을 선택할 때마다 오차 타원과 화살표가 나오거나 사라집니다.


    등록 정보 창 - 추정 오차 페이지

추가 정보

 기타

개요

추정 오차 페이지는 망 조정 후 결정되는 포인트 오차를 표시합니다. 이 페이지는 Network Adjustment 모듈이 설치되어 있는 경우에만 나오는데, 망 조정을 수행한 후 볼 수 있습니다.

이 페이지를 보려면:

1.	보고자 하는 포인트를 더블 클릭합니다. 그 포인트가 선택된 상태로 등록 정보 창이 나옵니다.

2.	[측량] 탭 하의 [추정 오차] 단추 [image] 를 누릅니다.

추정 오차 페이지에는 다음과  같은 필드가 있습니다.

위거, 경거

수평 좌표 구성 요소의 표준 오차가 표시됩니다.

표고, 고도

수직 좌표 구성 요소의 표준 오차가 표시됩니다.

신뢰도

전파 오차 결과값의 신뢰도가 표시됩니다.