Copyright: 1999-2002 Trimble Navigation Limited


GPS 처리 세션을 중지하려면

 개요 및 추가 정보

GPS 기선 처리 세션이 시작되면 처리기는 선택된 각각의 기선에 대해 연속된 일련의 처리 "패스(pass)"를 실행합니다. 패스의 수, 그리고 각 패스 마다 수행하는 작업의 수는 GPS 처리 스타일 설정과 그 이전 패스의 결과에 의해 영향을 받습니다. 이 작업을 중지하고 현재의 GPS 처리 세션을 취소 할 수 있습니다.

GPS 처리작업을 중지시키면 처리기는 [취소] 메시지를 받는 즉시 처리를 중단합니다. 그러나 어떤 경우에는 사용자가 취소를 클릭한 시간 보다 기선 처리기가 이 취소 메시지를 수신하는 시간이 약간 늦을 수 있습니다.

GPS 처리를 중지하려면:

1.	취소를 클릭합니다. GPS 처리기가 정말 취소할 것인지 확인 질문을 합니다.

2.	다음 중 한가지를 실행합니다:

 확실히 처리 세션의 취소를 원할 경우에는 예를 클릭합니다.

 취소한 것을 무시하고 처리 세션을 계속하려면 아니오를 클릭합니다.


선점 타임 스팬(time span)을 조정하려면

 개요 및 추가 정보

선점 지속시간을 짧게 하기 위해서 static 선점 또는 연속 Kinematic 선점 세그먼트의 타임 스팬을 조정할 수 있습니다. 타임 스팬은 다음과 같은 방법으로 조정할 수 있습니다.

 선점 등록 정보를 편집하여.

 선점 요소를 직접 편집하여.

아래에는 위 두 가지 방법을 사용하여 타임 스팬을 조정하는 방법이 설명되어 있습니다.

선점 등록 정보를 편집하여 타임 스팬을 조정하려면:

1.	먼저 선점 등록 정보를 보기 위해 다음 중 한가지를 실행합니다:

 선점 요소를 두 번 클릭합니다.

 선점 요소를 오른쪽 마우스 단추로 클릭한 다음 [등록 정보]를 선택합니다

[선점/데이터 세그먼트 등록 정보] 대화 상자가 나타납니다.

2.	[시작 시간] 및 [정지 시간] 필드를 편집합니다.

타임 스팬의 지속 시간은 감소만 시킬 수 있습니다.

3.	확인을 클릭합니다.

대화 상자가 닫히고 변경된 사항이 선점 요소의 모양에 반영됩니다. 선점 요소는 검은색 테두리의 직사각형으로 표시됩니다. 검은색 테두리는 선점 요소의 원래 타임 스팬을 나타내고 직사각형 내에 색으로 채워져 있는 직사각형 영역은 편집된 선점 요소에 의해 점유된 타임 스팬을 나타냅니다.

선점요소를 직접 편집하여 타임 스팬을 조정하려면:

1.	선점 요소의 앞쪽 가장자리로 마우스를 이동합니다.

커서가 양쪽에 화살표가 있는 선으로 바뀝니다.

2.	마우스의 왼쪽 단추를 누른 채로 다음 동작을 합니다.

3.	시간자(time ruler)를 주시하면서 선점의 앞쪽 가장자리를 오른쪽으로 끌어 당깁니다.

가장자리가 이동할 때 내부에 있는 색은 마우스와 함께 움직이지만 검은색 직사각형 테두리는 제 자리를 유지합니다.

참조: 선점 요소에 흰 바탕이 생기면( 즉, 색이 채워져 있지 않은 부분이 있는 경우)에는 선점 타임 스팬이 편집되었다는 표시 입니다.

4.	선점의 앞쪽 가장자리가 시간 자에서 사용자가 원하는 정확한 위치에 올 때 마우스의 왼쪽 단추를 놓습니다.

5.	선점의 뒤쪽 가장자리를 조정하려면 역으로 마우스를 이동하여 위의 과정을 반복합니다.


GPS 기선 처리 보고서를 분석하려면

 개요 및 추가 정보

GPS 기선 처리 후, 경고 플래그가 그래픽 창에 나타날 수 있습니다. GPS 기선이 활성 GPS 처리 스타일에 정의된 질 수용 테스트 중 어느 하나라도 통과하지 못한 경우에는 기선의 중심에 이 플래그가 나타납니다. 경고 플래그가 나타난 기선은 그 플래그의 원인을 찾기 위해 좀더 자세하게 검사할 필요가 있습니다. 다른 GPS 처리 스타일을 사용하여 처리를 재 실행 함으로서 기선 해의 전체적인 질을 향상시키는 기술이 필요할 경우도 있습니다.

각 기선마다 해당 데이터를 점차적으로 분석하고 교정해야 합니다. 그리고 기선을 분석하기 전에 특정의 기선 해에서 발견된 문제를 교정하고 해당 기선을 재 처리해야 합니다.

기선의 GPS 기선 처리 보고서 통계를 살펴 보고 다음의 질문을 해 보시기 바랍니다:

  해 유형이 무엇인가?

 기준 분산에 대한 비율은 어떤가?

 사거리가 얼마인가?

 사거리와 기선 구성 요소를 비교할 수 있는 다른 시점에 측정한 여유 기선이 있는가?

답이 확실하지 않을 경우에는 다음의 질문을 해 보시기 바랍니다:

 선점 시간이 얼마나 긴가?

 RMS가 15 mm 미만인가?

 추적 요약이 처리된 세그먼트의 갭(gap)을 보여주는가?

 잔차 플롯이 15 mm 범위 내에서 0 주위를 대칭으로 회전하는가?

비율, 기준 분산, RMS 테스트의 결과를 분석하려면 기선 해를 수용하고 기각하는데 사용되는 조건을 이해할 필요가 있습니다.

다른 GPS 처리 스타일 설정은 이 수용 테스트의 결과에 영향을 줄 수 있습니다. 어떻게 해가 수용되고 기각되는지 이해하기 위해 이 설정의 원리를 알아야 합니다. 추가 정보는 [고급 스타일 편집] 대화 상자를 참조하시기 바랍니다.

이러한 문제 해결 기술을 사용하면 기선 통계를 개선할 수도 있고 그렇지 않을 수도 있습니다. 현장에 돌아가기 전에 이 기술들을 하나씩 시도해 보시기 바랍니다. 아래에 열거된 기술들은 사용하기 간단하고 효과적인 순서로 되어 있습니다. 이 문제 해결 방법들을 이용하면 현장에서 기선 재관측을 하지 않아도 될 경우가 있습니다.

문제 해결 방법:

 위성을 불이용 상태로 만듬

 사이클 슬립을 편집

 잘못된 거리 데이터를 편집

 임계 앙각을 평가하고 증가 시킴

기선 처리 세션에 대한 추가 정보는 기선 처리 로그를 참조하시기 바랍니다.


위성 플롯 상의 위성 추적 데이터를 분석하려면

 개요 및 추가 정보

위성 추적 정보가 위성 플롯(SV Plot) 창에 플로팅 된 경우에는 모순된 데이터를 눈으로 확인할 수 있습니다.

데이터를 비교하기 위하여 다수의 위성 추적 정보를 동일 위성 플롯 창에 플로팅 할 수 있습니다. 또는 새로운 창을 만들어 동일 위성추적 정보에 대해 여러 개의 플롯을 볼 수 있습니다.

데이터를 화면에 플로팅 할 수 있을 뿐만 아니라, 플롯들을 인쇄할 수 도 있고 플롯을 만들 때 사용한 정보를 표 형식의 파일로 출력할 수 도 있습니다.

데이터를 플로팅 하려면:

1.	Timeline을 보기 위해 다음 중 한가지를 실행합니다:

 보기 / Timeline을 선택합니다.

 Alt+VI 를 누릅니다.

Timeline이 나타납니다.

2.	데이터 폴더를 클릭합니다.

데이터 폴더는 제어 표시줄에 있습니다. 데이터 폴더가 닫혀 있을 때는 [image] 기호가 나타나고 열려 있을 때는 [image] 기호가 나타납니다.

데이터 폴더에는 데이터 수집 시 사용된 수신기의 종류(모델 번호)와 일련 번호가 나타납니다. 데이터 폴더를 두 번 클릭하면 수집된 데이터와 관련된 수신기 등록 정보가 나타납니다.

데이터 폴더를 열면 측량 타임 스팬에 걸쳐 추적된 모든 위성의 아이콘들이 제어 표시줄에 나타납니다.

참조: 데이터 폴더를 하나씩 열지 않고 [모두 개방] 명령을 사용하여 한꺼번에 모두 열 수 있습니다.

3.	위성 아이콘을 두 번 클릭합니다.

위성 플롯 창이 나타납니다.

4.	위성 추적 정보 플롯을 표시하기 위하여 다음 중 한가지를 실행합니다:

 [대화 상자 표시줄] 상의 단추들을 클릭하여 하나 또는 그 이상의 플롯을 선택합니다.

 [보기 / 데이터] 서브 메뉴에서 하나 또는 그 이상의 명령어를 선택합니다.

관측 타임 스팬에 걸쳐 선택된 위성의 수집된 모든 해당 데이터가 플로팅 됩니다.

5.	플로팅된 위성 추적 정보를 눈으로 점검하고 데이터의 모순을 찾습니다.

일단 플롯이 표시되면 다음의 작업을 실행할 수 있습니다:

플롯 관측값을 표시하기위해:

1.	마우스 커서를 플롯 위의 원하는 위치로 이동시킵니다.

2.	상태 표시줄에 관측값과 시간 정보가 나타납니다.

마우스가 위치하고 있는 곳의 플롯 관측값과 데이터 수집시간이 상태 표시줄에 나타납니다.

플롯을 인쇄하려면:

1.	[인쇄] 명령을 선택하기 위해 다음 중 한가지를 실행합니다:

 파일 / 인쇄를 선택합니다.

 Ctrl+P를 누릅니다.

 도구 모음에서 [image] 를 클릭합니다.

[인쇄] 대화 상자가 나타납니다.

2.	원하는 옵션을 선택합니다.

3.	확인을 클릭합니다.

플롯이 인쇄됩니다.

플롯을 파일로 출력하려면:

1.	[인쇄] 명령을 선택하기 위해  다음 중 한가지를 실행합니다:

 파일 / 인쇄를 선택합니다.

 Ctrl+P를 누릅니다.

 도구 모음에서 [image] 를 클릭합니다.

[인쇄] 대화 상자가 나타납니다.

2.	[파일로 인쇄] 옵션을 선택합니다.

3.	확인을 클릭합니다.

플롯이 파일로 출력됩니다. 많은 프로그램의 경우 [가져오기]기능으로 파일로 출력된 그래픽 파일을 다시 불러올 수 있습니다. 이 기능은 보고서에 플롯을 포함시킬 때 유용하게 사용할 수 있습니다.

표 형식으로 되어 있는 데이터를 인쇄하려면:

1.	[내보내기] 명령을 선택하기 위해 다음 중 한가지를 실행합니다:

 파일 / 내보내기를 선택합니다.

 Alt+FE를 누릅니다.

[다름 이름으로 저장] 대화 상자가 나타납니다.

2.	파일을 저장할 폴더와 파일 이름을 선택합니다.

플롯을 만드는데 사용된 위성 추적 정보는 텍스트 (*.txt) 파일로 작성되어 선택한 폴더에 저장됩니다. 이 데이터는 표 형식의 파일로 작성됩니다. 여러 개의 플롯이 동일 위성 플롯 창에 표시될 경우에는 각 플롯 형식마다 하나의 표 데이터 열이 작성됩니다.


Static 선점 종류를 변경하려면

 개요 및 추가 정보

Static 선점의 선점 종류를 변경 할 수 있습니다.

선점 종류를 변경하려면:

1.	선점 요소를 두 번 클릭합니다. [선점/데이터 세그먼트 등록 정보] 대화 상자가 나타납니다.

2.	세그먼트 형식 목록을 엽니다.

3.	선점 종류를 선택하기 위해 다음 옵션 중 한가지를 선택합니다:

 Static 선점

 연속 세그먼트

 이동 세그먼트

4.	확인을 클릭합니다.

변경된 사항이 저장됩니다.

경고: 일단 변경된 사항이 효력을 발생한 후에는 연속 세그먼트 또는 이동 세그먼트를 Static 선점으로 다시 변경할 수는 없습니다. 따라서 선점 종류를 변경할 때는 주의를 요합니다.


연속 세그먼트 형식을 변경하려면

 개요 및 추가 정보

연속 Kinematic 세그먼트의 선점 종류를 변경할 수 있습니다.

선점 종류를 변경하려면:

1.	선점 요소를 두 번 클릭합니다. [선점/데이터 세그먼트 등록 정보] 대화 상자가 나타납니다.

2.	세그먼트 형식 목록을 엽니다

3.	선점 종류를 선택하기 위해 다음 옵션 중 한가지를 선택합니다:

 연속 세그먼트

 이동 세그먼트

4.	확인을 클릭합니다.

변경된 사항이 저장됩니다.

참조: 연속 세그먼트는 이동 세그먼트로 만 변경할 수 있습니다. 연속 세그먼트 또는 이동 세그먼트를 선점으로 되돌릴 수는 없습니다.


시간 옵션을 변경하려면

 개요 및 추가 정보

시간자의 시간 단위는 GPS 주/초 또는 윈도우의 로컬 시간으로 설정할 수 있습니다.

시간 단위를 변경하려면:

1.	[시간 옵션] 대화 상자를 불러오기 위해 다음 중 한가지를 실행합니다:

 시간자를 두 번 클릭합니다.

 [시간자]를 오른쪽 마우스 단추로 클릭해서 [시간 옵션]을 선택합니다.

[시간 옵션] 대화 상자가 나타납니다.

2.	다음의 시간 포맷 중 한가지를 선택합니다.

 윈도우의 시간 표시 형식과 일치하는 로컬 시간

 GPS 주/초

3.	확인을 클릭합니다.

[시간자]의 [시작 시간] 및 [정지 시간] 필드가 업데이트 되어 시간 단위가 변경 되었음을 보여줍니다. 이 작업은 또한 [Timeline 등록 정보] 대화 상자, 하늘 플롯, DOP 플롯, 위성 플롯 및 상태 표시줄에 표시되는 시간의 단위에도 영향을 미칩니다.


GPS 관측치의 사이클 슬립을 보정하려면

 개요 및 추가 정보

GPS 관측치의 위성 추적 플롯에서 발견되는 사이클 슬립을 편집하여 차후의 GPS 기선 처리 세션에서 사이클 슬립을 선택적으로 제거할 수 있습니다. 사이클 슬립은 높은 관측치 잔차로 인해 기선해가 플래그 되었을 경우와, Timeline을 사용하는 중 다수의 사이클 슬립이 발견되었을 경우에만 편집하여야 합니다.

참조: 대부분의 경우 기선 처리기는 자동으로 사이클 슬립을 처리하기 때문에 수동 편집은 필요하지 않습니다. Timeline의 GPS 관측치를 검사 함으로서 사이클 슬립을 GPS 기선 처리 전이나 후에 검출할 수 있습니다. 문제가 있는 데이터는 GPS 관측치의 위성 추적 플롯에서 눈에 띄는 모양을 가지고 있습니다. 위성 추적 정보에서 사이클 슬립과 기타의 갭(gap)의 모양에 대해서는GPS 관측치를 참조하시기 바랍니다.

사이클 슬립을 편집하려면:

1.	플래그가 있는 기선의 GPS 기선 처리 보고서를 인쇄합니다.

계속 진행하기 전에 플래그가 있는 기선 해에 대한 처리 결과를 먼저 인쇄 할 것을 권장합니다. 기선 해가 나중에 재처리 되었을 때 다음 GPS 기선 처리 세션에서 수집된 결과와 비교하는데 이 데이터를 이용할 수 있습니다.

2.	GPS 관측치를 검사하여 확인 가능한 사이클 슬립을 찾아 냅니다.

3.	해당 사이클 슬립을 마우스로 직사각형을 그려 선택합니다.

Timeline 은 자동으로 L1 및 L2 반송파의 추적 정보를 선택합니다. 선택한 L1 및 L2 반송파 데이터를 삭제하는 옵션은 아래 6번을 참조하시기 바랍니다.

4.	GPS 관측치 등록 정보를 보기 위해 다음 중 한가지를 실행합니다:

 선택 부분의 직사각형을 두 번 클릭합니다.

 선택부분의 직사각형을 오른쪽 마우스 단추로 클릭한 후 [등록 정보]를 선택합니다.

[GPS 관측치 등록 정보] 대화 상자가 나타납니다.

5.	[시작 시간] 및 [정지 시간] 필드 중 한가지 또는 두 가지 모두를 편집합니다.

시간을 편집하여 데이터를 무시한 경우, 차후의 GPS 기선 처리 세션에서 사이클 슬립이 제거됩니다. 나중에 기선을 재처리할 경우 기선 처리기는 플래그가 있는 기선의 새로운 해를 결정할 때 해당 데이터를 무시합니다.

6.	해당되는 관측치 종류로부터 점검 표시를 해제합니다. 이것은 지정된 타임 스팬 동안 어떤 관측치 종류를 불이용 상태로 할 것인지를 결정해 줍니다.

7.	확인을 클릭하여 변경 사항을 적용합니다. 대화 상자가 닫히고 선택 직사각형 내의 불이용 상태로 되어 있는 위성 추적 데이터의 색이 회색으로 변합니다. 이것은 차후의 처리 세션에서 기선 해를 결정하는데 이 데이터가 더 이상 사용되지 않음을 나타냅니다.

8.	기선을 재처리 하려면 측량 / GPS 기선 처리를 선택합니다. [GPS 처리] 대화 상자가 나타나고 기선 처리가 시작됩니다.

9.	GPS 처리 목록으로부터 해를 선택합니다.

10.	보고서를 클릭합니다. GPS 기선 처리 보고서가 나타납니다.

11.	기선의 새로운 처리 결과와 이전 기선 처리 세션의 결과를 비교합니다.

12.	두개의 기선 처리 세션 결과를 비교한 후 다음 중 한가지를 실행합니다:

 기선 사거리 및 통계가 향상 되었을 경우 기선 해를 사용자의 망(네트웍)에 저장합니다.

 향상이 되지 않았을 경우 [GPS 관측치 등록 정보] 대화 상자로 돌아가서 불이용 상태의 관측치 종류를 이용 상태로 다시 변경하고 확인을 클릭합니다.


GPS 관측치에서 잘못된 거리 데이터를 보정하려면

 개요 및 추가 정보

GPS 관측치의 위성 추적 플롯에서 잘못된 거리 데이터는 사이클 슬립에 비해 아주 드물게 발견됩니다. 잘못된 거리 데이터가 발생할 가능성은 거의 없지만 발생하였을 경우, 이를 편집하여 추후의 GPS 기선 처리 세션에서 이를 선택적으로 삭제할 수 있습니다. 잘못된 거리 데이터는 높은 관측치 잔차 때문에 기선 해에 플래그가 있는 경우와, Timeline의 추가 검사에서 잘못된 거리 데이터가 발견된 경우에만 편집해야 합니다.

참조: 잘못된 거리 데이터는 Timeline의 GPS 관측치를 검사 함으로서 GPS 기선 처리 전이나 후에 검출할 수 있습니다. 문제가 있는 데이터는 GPS 관측치의 위성 추적 플롯에서 눈에 띄는 모양을 가지고 있습니다. 위성 추적 정보에서 잘못된 거리 데이터, 사이클 슬립, 다른 결함의 모양은GPS 관측치에 설명되어 있습니다.

잘못된 거리 데이터를 편집하려면:

1.	플래그가 있는 기선의 GPS 기선 처리 보고서를 인쇄합니다.

계속 진행하기 전에 플래그가 있는 기선 해에 대한 처리 결과를 먼저 인쇄 할 것을 권장합니다. 기선 해가 나중에 재처리 되었을 때 다음 GPS 기선 처리 세션에서 수집된 결과와 비교하는데 이 데이터를 이용할 수 있습니다.

2.	GPS 관측치를 검사하여 확인 가능한 잘못된 거리 데이터를 찾아 냅니다.

3.	잘못된 거리 데이터를 마우스로 직사각형을 그려 선택합니다.

Timeline은 자동으로 L1 및 L2 반송파의 추적 정보를 선택합니다. 선택한 L1 및 L2 반송파 데이터를 삭제하는 옵션은 아래 6번을 참조하시기 바랍니다.

4.	GPS 관측치 등록 정보를 보기위해 다음 중 한가지를 실행합니다:

 선택부분의 직사각형을 두 번 클릭합니다.

 선택부분의 직사각형을 마우스의 오른쪽 단추를 이용하여 클릭하고 등록 정보를 선택합니다.

[GPS 관측치 등록 정보] 대화 상자가 나타납니다.

5.	[시작 시간] 및 [정지 시간] 필드 중 한가지 또는 두 가지 모두를 편집합니다.

시간을 편집하여 잘못된 거리 데이터를 무시한 경우, 차후의 GPS 기선 처리 세션에서 잘못된 거리 데이터가 제거됩니다. 나중에 기선을 재처리할 경우 기선 처리기는 영향을 입은 기선의 새로운 해를 결정할 때 해당 데이터를 무시합니다.

6.	해당되는 관측치 종류로부터 점검 표시를 해제합니다. 이것은 어떤 관측치 종류를 지정된 타임 스팬 동안 불이용 상태로 할 것인지를 결정합니다.

7.	확인을 클릭하여 변경 사항을 적용합니다.

대화 상자가 닫히고 선택 직사각형 내의 불이용 상태로 되어 있는 위성 추적 데이터의 색이 회색으로 변합니다. 이것은 차후의 처리 세션에서 기선 해를 결정하는데 이 데이터가 더 이상 사용되지 않음을 나타냅니다.

8.	해를 재처리 하기위해서는 다음 중 한가지를 실행합니다:

 측량 / GPS 기선 처리를 선택합니다.

 F9을 누릅니다.

[GPS 처리] 대화 상자가 나타나고 기선 처리가 시작됩니다.

9.	[GPS 처리 목록]에서 해를 선택합니다.

10.	보고서를 클릭합니다. GPS 기선 처리 보고서가 나타납니다.

11.	기선 처리 결과와 이전 처리 세션의 결과를 비교합니다.

12.	두개의 처리 세션의 결과를 비교한 후 다음 중 한가지를 실행합니다:

 기선이 향상 되었을 경우에는 사용자의 프로젝트에 기선 해를 저장합니다.

 향상이 되지 않았을 경우에는 위성 아이콘으로 돌아가서 그 위성의 측정치를 다시 이용 가능 상태로 만듭니다.


위성을 불이용 상태로 하려면

 개요 및 추가 정보

기선 처리 문제를 이해하기 위해 Timeline의 GPS 관측치를 검사할 수 있습니다. 문제를 일으킬 수 있는 몇 가지 상태는 다음과 같습니다:

 L1 또는 L2 추적에서의 사이클 슬립, 잘못된 위상, 다수의 갭(gap).

 잘못된 위성 기하, 특히 하나 또는 그 이상의 위성이 불이용 상태로 되어 있을 때

참조: 위성을 불이용 상태로 하면 그 위성과 관련된 모든 GPS 관측치도 불이용 상태가 됩니다. 각 GPS 관측치와 GPS 관측치 중 선택한 영역을 불이용 상태로 만들 수 있습니다. 추가 정보는 사이클 슬립 보정 및 잘못된 거리 데이터 보정을 참조하시기 바랍니다.

위성을 불이용 상태로 하려면:

주의: 위성을 불이용 상태로 하기 전에 그 위성을 제거 함으로 위성군의 기하에 역효과가 나타나지는 않는지 확인하시기 바랍니다.

1.	Timeline을 보기위해 다음 중 한가지를 실행합니다:

 보기 / Timeline을 선택합니다.

 Alt+VI를 누릅니다.

Timeline이 나타납니다.

2.	해당 데이터를 포함하고 있는 데이터 폴더를 찾습니다. 다음, 불이용 상태로 만들기를 원하는 위성의 시간을 포함하는 측량 요소를 찾습니다. [스팬 범위 보기] 명령을 사용하여 타임 스팬 뷰어가 채워지도록 측량 요소를 확대합니다.

두 가지 방법으로 해당되는 폴더를 식별할 수 있습니다: 폴더 그 자체에 열거되는 수신기 종류(모델 번호)와 일련 번호로 식별하거나 측량 세션 ID를 가진 라벨이 있는 측량요소로 식별할 수 있습니다.

3.	데이터 폴더를 열기 위해서는 [image] 를 클릭합니다.

측량에 데이터를 제공하는 위성 아이콘들이 제어 표시줄에 표시되고 타임 스팬 뷰어는 각 위성에 대한 GPS 관측치 요소를 표시합니다.

참조: 타임 스팬 뷰어에 모든 위성의 데이터를 표시하려면 Timeline 보기 영역을 재 조정합니다.

4.	갭(gap)이 있나 GPS 관측치 요소를 살펴봅니다.

L1 및 L2 반송파에서의 갭은 위성 신호 사이클 슬립, 잘못된 거리 오차, 및 기타의 신호 손실의 문제가 있음을 의미 할 수 있습니다. 사이클 슬립의 모양 및 기타의 반송파 손실 문제에 대한 추가 정보는GPS 관측치를 참조하시기 바랍니다.

5.	위성 아이콘을 오른쪽 마우스 단추로 클릭합니다.

6.	[이용/불이용]을 선택합니다. 데이터를 불이용 상태로 하면GPS 관측치 요소가 회색으로 표시됩니다.

7.	기선을 선택합니다.

8.	해를 재 처리하기위해 다음 중 한가지를 실행합니다:

 측량 / GPS 기선 처리를 선택합니다.

 F9를 누릅니다.

[GPS 처리] 대화 상자가 나타나고 기선 처리가 시작됩니다.

9.	[GPS 처리 목록]에서 해를 선택합니다.

10.	보고서를 클릭합니다. GPS 기선 처리 보고서가 나타납니다.

11.	기선 처리 결과와 이전 처리 세션의 결과를 비교합니다.

12.	두개의 처리 세션의 결과를 비교한 후 다음 중 한가지를 실행합니다:

 기선이 향상 되었을 경우 사용자의 프로젝트에 기선 해를 저장합니다.

 향상이 되지 않았을 경우 위성 아이콘으로 돌아가서 그 위성의 해당 측정치를 다시 이용 상태로 만듭니다.


Timeline에서 GPS 관측치를 불이용 상태로 하려면

 개요 및 추가 정보

Timeline에서 특정의 위성에 대한 각 GPS 관측치 요소, 여러 개의 GPS 관측치 또는 모든 GPS 관측치를 불이용 상태로 만들 수 있습니다. GPS 관측치를 불이용 상태로 만들기 전에 그 위성을 제거 함으로서 위성군의 기하에 역효과가 나타나지는 는 지 확인하시기 바랍니다.

참조: GPS 관측치의 선택된 범위 및 선택된 원시 위성 추적 정보를 편집하여 전체적인 관측치의 질을 향상시킬 수 있습니다. 이 방법의 예는 보려면 잘못된 거리 데이터 보정을 참조하시기 바랍니다.

하나의 GPS 관측치를 불이용 상태로 만들려면

1.	이용 상태로 되어 있는 [GPS 관측치]를 클릭합니다.

2.	GPS 관측치를 오른쪽 마우스 단추로 클릭합니다.

3.	[이용/불이용]을 선택합니다.

이용 상태였던 GPS 관측치가 불이용 상태가 되고 모양이 변경되어 불이용 상태를 나타냅니다.

여러 개의 GPS 관측치를 불이용 상태로 만들려면:

1.	여러 개의 GPS 관측치를 마우스로 직사각형을 그어 선택 합니다.

2.	선택부분의 직사각형 내에서 오른쪽 마우스 단추를 클릭합니다.

3.	[이용/불이용]을 선택합니다.

이용 상태였던 GPS 관측치들이 불이용 상태가 되고 모양이 변경되어 불이용 상태를 나타냅니다.

특정 위성의 모든 GPS 관측치를 불이용 상태로 만들려면:

1.	GPS 관측치와 관련되어 있는 위성 아이콘을 클릭합니다.

2.	아이콘을 오른쪽 마우스 단추로 클릭합니다.

3.	[이용/불이용]을 선택합니다.

위성과 관련된 모든 GPS 관측치가 불이용 상태가 됩니다.


GPS 처리의 수용 기준을 편집하려면

기선 해를 수용하거나 기각하는데 질 수용 기준으로 세 가지의 GPS 처리 질 테스트(비율 테스트, 기준 분산 테스트, RMS 테스트)를 이용합니다.

수용 기준을 편집하려면:

1.	[GPS 처리 스타일] 대화 상자를 보기위해서 다음 중 한가지를 실행합니다:

 측량 / GPS 처리 스타일을 선택합니다.

 Alt+UP을 누릅니다.

[GPS 처리 스타일] 대화 상자가 나타납니다.

2.	목록에서 활성 스타일을 선택합니다.

3.	편집을 클릭합니다. [스타일 편집] 대화 상자가 나타나며, 제목 표시줄에 스타일 이름이 나타납니다.

4.	고급을 클릭합니다. [고급 스타일 편집] 대화 상자가 나타납니다.

5.	[질] 탭을 선택합니다. 수용 기준 그룹은 세 가지의 수용 테스트를 이용 상태 및 불이용 상태로 만들 수 있는 체크 상자를 가지고 있습니다. 이들은 [If RMS], [If 비율], [If 기준 분산] 필드로 표시됩니다. 각 테스트에 네 개의 데이터 입력 필드가 포함되어 있습니다. [플래그] 및 [수준 미달] 필드가 두 세트 있는데 한 세트는 1 주파수 수신기를 위한 것이고 다른 한 세트 2 주파수 수신기를 위한 것입니다.

참조: 기선에 1 주파수 수용 기준이 사용될 경우는 두 가지가 있습니다. 첫번째는 기선의 수신기 중 적어도 한 개의 수신기가 1 주파수 수신기 일 때이고, 두 번째는 활성 GPS 처리 스타일의 [전리층] 탭에 지정 되어 있는 기선의 길이가 최종 통과 길이 보다 적을 때 입니다.

6.	[If 비율] 체크 상자를 선택하거나 선택을 해제하여 비율 수용 테스트를 이용 상태 또는 불이용 상태로 만듭니다.

7.	1 주파수 혹은 2 주파수 수신기의 플래그 값을 입력합니다.

8.	1 주파수 혹은 2 주파수 수신기의 수준 미달 값을 입력합니다.

9.	[If 기준 분산] 체크 상자를 선택하거나 선택을 해제하여 기준 분산 수용 테스트를 이용 상태 또는 불이용 상태로 만듭니다.

10.	1 주파수 혹은 2 주파수 수신기의 플래그 값을 입력합니다.

11.	1 주파수 혹은 2 주파수 수신기의 수준 미달 값을 입력합니다.

12.	[If RMS] 체크 상자를 선택하거나 선택을 해제하여 RMS 수용 테스트를 이용 상태 또는 불이용 상태로 만듭니다.

13.	1 주파수 혹은 2 주파수 수신기의 플래그 값을 입력합니다.

14.	1 주파수 혹은 2 주파수 수신기의 수준 미달 값을 입력합니다.

15.	[승수 편집]을 편집하고 확인을 클릭합니다.

변경된 사항이 저장됩니다.

참조: 대부분의 측량 응용 프로그램의 경우 수용 기준을 편집할 필요가 없습니다. 그러나 코드 전용 최종 통과 해에 대해서는 예외가 적용됩니다. 일반적으로 코드 전용 해는 Trimble 기본 처리 스타일에 있는 기준에 기초하여 플래그를 표시 합니다. 사용자가 코드 전용 최종 통과 해를 일상적으로 처리하는 경우에는 적당한 수용 기준을 가지고 있는 코드 전용 처리 스타일을 설정할 것을 권장합니다.


GPS 처리 스타일 [이벤트] 옵션을 편집하려면

GPS 처리 스타일의 이벤트 옵션은 이벤트 표시를 가진 연속 kinematic 측량이 처리될 때 이벤트 위치가 어떻게 생성되는지를 결정해 줍니다.

이벤트 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[이벤트] 탭에서 [보간법] 옵션 중의 한가지를 선택합니다.

3.	나머지 필드에 다음을 입력합니다:

 적용 포인트 갯수

 유실 에포크의 최대 허용 갯수

 시간 옵셋 (마이크로 초로 표시)

4.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우에는 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [전리층] 옵션을 편집하려면

 개요 및 추가 정보

GPS 처리 스타일의 전리층 옵션은 모호 정수 결정 및 최종 처리 반복 연산을 수행할 때 전리층 오차를 보상하는데 사용합니다.

전리층 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[전리층] 탭을 선택합니다.

3.	모호 정수 결정 통과 그룹에서 [다음보다 긴 기선 모두에 적용] 체크 상자를 선택하거나 선택을 해제하여 이 옵션을 이용 상태 또는 불이용 상태로 만듭니다. 이 옵션이 이용 상태일 경우, 적당한 거리 값을 입력합니다.

4.	최종 통과 그룹에서 [다음보다 긴 기선 모두에 적용] 체크 상자를 선택하거나 선택을 해제하여 이 옵션을 이용 상태 또는 불이용 상태로 만듭니다. 이 옵션이 이용 상태일 경우, 적당한 거리 값을 입력합니다.

5.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [kinematic] 옵션을 편집하려면

GPS 처리 스타일의 kinematic 옵션은 kinematic 관측치를 처리할 때 적용됩니다.

Kinematic 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[Kinematic] 탭을 선택합니다.

3.	해당 필드에 다음을 입력합니다:

 최소 기준 관측 시간 (초로 표시)

 Static 초기화 최소 관측 시간 (초로 표시)

 알려진 측점 최소 초기화 율 (비율)

 최소 OTF 처리 시간 (초로 표시)

4.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [OTF 검색] 옵션을 편집하려면

GPS 처리 스타일의 OTF 검색 옵션은 GPS 처리 반복 연산을 하는 동안 이동 중(on-the-fly)의 검색을 할 때 사용됩니다.

OTF 검색 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[OTF 검색] 탭을 선택합니다.

3.	[검색법] 그룹에서 적당한 옵션을 선택합니다. [전방 순차 검색] 또는 [후방 순차 검색] 옵션을 선택하였을 경우에는 [순차 제어] 그룹의 필드가 이용 가능하게 됩니다.

4.	최소 검색률을 입력합니다.

5.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [질] 옵션을 편집하려면

GPS 처리 스타일의 질 옵션은 기선이 프로젝트에 저장되기 전에, 기선의 질을 점검하기 위해 사용되는 비율, RMS, 기준 분산 테스트를 이용 상태 및 불이용 상태로 만들거나, 이들을 정의하는데 사용됩니다.

기본값으로 수용 테스트 기준에 통과하지 못한 기선은 프로젝트에 저장되지 않게 되어 있습니다. 플래그가 있는 기선은 프로젝트에 저장되기는 하지만, 기선의 중심에 붉은 경고 플래그를 표시하여 이 기선이 망에 잘 맞는지 점검해야 된다는 것을 예시해 줍니다. 기선에 플래그가 있게 되는 원인을 찾는 방법에 대한 추가 정보는 데이터 분석을 참조하시기 바랍니다.

질 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[질] 탭을 선택합니다.

3.	[수용 기준] 그룹에서 [If 비율], [If 기준 분산], [If RMS] 체크 상자를 선택하거나 선택을 해제하여 이 테스트를 이용 상태 또는 불이용 상태로 만듭니다.

4.	각 테스트에 대한 적당한 [플래그] 및 [수준 미달] 필드를 선택하고 요구되는 값을 입력합니다.

참조: 기본 설정 값은 대부분의 측량 응용 프로그램에 적합하도록 설정되어 있기 때문에 이 기본 설정 값을 변경하지 않을 것을 권장합니다.

5.	[승수 편집] 필드에 값을 입력합니다.

6.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [static] 옵션을 편집하려면

GPS 처리 스타일의 Static 옵션은 Static 측량 방법을 사용하여 수집된 기선 데이터를 처리할 때 사용됩니다.

Static 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[Static] 탭을 선택합니다.

3.	[기선 최소 관측 시간] 필드에 초로 된 값을 입력합니다.

이 값은 두개 또는 그 이상의 수신기에서 수집된 측정 값을 동시에 처리할 때, 처리 전에 경과해야 하는 기선 최소 관측 시간입니다. 기선 처리기는 수신기 간의 기선을 처리하기 위해 120 초 동안 동시에 측정한 데이터를 요구 합니다. 이는 다중 로버(rover)와의 우발적인 중복을 막아줍니다. 기본값은 120 초 입니다.

4.	[고정해가 가능한 최대 기선 길이] 그룹에서 다음을 실시합니다:

 [방송 궤도력 이용시] 필드에 기선 거리 (프로젝트 단위로)를 입력합니다. 기본값은 200 킬로미터 입니다.

 [정밀 궤도력 이용시] 필드에 기선 거리 (프로젝트 단위로)를 입력합니다. 기본값은 2000 킬로미터 입니다.

5.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [대류권] 옵션을 편집하려면

GPS 처리 스타일의 대류권 옵션은 기선 처리 중에 대류권 보정을 적용하기 위해 사용됩니다.

대류권 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[대류권] 을 선택합니다.

3.	모델의 목록에서 적당한 대류권 모델을 선택합니다.

4.	[추정 천정 지연 간격]에 시간 단위의 값을 입력합니다.

최소 권장 추정 간격은 한시간 입니다. 기본값은 두시간입니다. 추정 간격 값이 0일 경우 천정 지연 추정을 하지않습니다. 대류권 모델 값이 [없음]으로 설정 되어 있을 경우에는 이 필드는 이용할 수 없습니다.

5.	[기상 관측 데이터 이용] 체크 상자를 선택하여 GPS 처리 해를 계산할 때 적용하는 기상 데이터의 형식을 선택합니다. 기상 데이터는 상대 습도, 기압, 온도로 구성되어 있습니다.

 이 체크 상자를 선택하였을 경우에는 대류권 천정 지연을 계산할 때 대류권을 모델링 하는 데 데이터 파일이나 RINEX 파일에 있는 관측 기상 데이터가 사용됩니다. 기본값으로 이 체크 상자는 선택되어 있습니다.

 기록된 기상 데이터 위치에 표준 기상 값을 사용하려면 이 체크 상자의 선택을 해제합니다.

6.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일을 편집하려면

 개요 및 추가 정보

GPS 처리 스타일을 편집할 때는 두 개의 대화 상자를 이용할 수 있습니다. 첫번째는 일반적인 옵션을 가진 대화상자이고 두 번째는 GPS 처리 스타일을 정밀하게 조정할 수 있는 고급 설정 옵션을 가진 대화상자 입니다. 편집하기 전에 이 두 대화상자는 Trimble Geomatics Office 소프트웨어의 기본 스타일 설정을 나타냅니다. 이 기본 설정은 대부분의 측량 응용 프로그램에 적당하도록 되어 있습니다

일반적인 옵션을 편집하려면:

1.	다음 중 한가지를 실행합니다:

 측량 / GPS 처리 스타일을 선택합니다.

 Alt+UP을 누릅니다.

[GPS 처리 스타일] 대화 상자가 나타납니다.

2.	목록에서 하나의 스타일을 선택합니다.

3.	편집을 클릭합니다. [스타일 편집] 대화 상자가 나타납니다.

4.	[임계 앙각] 필드에 임계 앙각 값을 입력합니다. 입력한 임계 앙각 값이 데이터를 수집할 때의 임계 앙각 값 위에 덮어 씌어집니다.

5.	[위성 궤도력] 목록에서 [방송력] 또는 [정밀력]을 선택합니다. [방송력]을 선택하였을 경우 GPS 처리기는 측량 세션에 데이터를 제공하는 모든 위성을 위해 수집한 방송 궤도력을 사용합니다. [정밀력]을 선택하였을 경우 GPS 처리기는 프로젝트 내로 가져온 현재의 정밀 궤도력을 사용합니다.

6.	[해 유형] 목록에서 [코드], [유동] 또는 [고정]을 선택합니다.

7.	다음 중 한가지를 실행합니다:

 일반 옵션만을 변경하고자 할 경우에는 확인을 클릭하여 변경된 사항을 저장합니다.

 고급 옵션을 편집할 필요가 있을 경우에는 다음 일련의 과정을 실행합니다.

고급 옵션을 편집하려면:

 [스타일 편집] 대화 상자에서 고급을 클릭합니다.

[고급 스타일 편집] 대화 상자가 나타납니다. 이 대화 상자는 다음의 탭을 포함하고 있습니다:

 Static

 Kinematic

 글로벌

 질

 대류권

 전리층

 이벤트

 OTF 검색

이 대화 상자에서 적당한 옵션을 편집한 후 확인을 클릭합니다. 변경 사항이 저장되고 [스타일 편집] 대화 상자로 되돌아 갑니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


GPS 처리 스타일 [글로벌] 옵션을 편집하려면

GPS 처리 스타일의 글로벌 옵션은 각 GPS 처리기 패스(pass)를 실행할 때 사용됩니다.

글로벌 옵션을 편집하려면:

1.	[고급 스타일 편집] 대화 상자를 엽니다.

2.	[글로벌] 탭을 선택합니다.

3.	주파수 종류 목록에서 L1, L2, 광역 또는 협역을 선택합니다.

4.	나머지 필드에 다음을 입력합니다:

 조정 가능한 최대 사이클 슬립(초로 표시)

 최대 반복 연산 수(정수 값) − GPS 처리기는 각 기선 해를 처리하는 동안 최대  반복 연산 수 이상을 수행하지 않습니다.

 최대 정수 검색 시간(분으로 된 정수 값) − 이 시간 값이 경과하면 GPS 처리기는 추가 처리 반복 연산을 중지하고 유동 해를 사용합니다.

5.	더 이상의 변경이 필요 없을 경우 확인을 클릭합니다.

변경 사항이 저장됩니다.

참조: 대부분의 측량 응용 프로그램의 경우 고급 조절을 편집할 필요가 없습니다. 이 조절을 변경하고자 할 경우 변경된 사항을 저장하고 개정된 스타일을 활성 스타일로 지정하기 전에 이 변경 사항이 미치는 효과를 이해 하여야만 합니다.


[모호 정수 결정 통과] 기선 거리를 편집하려면

이 체크 상자를 이용하여 모호 정수 결정 GPS 처리 통과를 하는 동안 전리층 모델 보정을 이용 상태 또는 불이용 상태로 만들 수 있습니다. [다음 보다 긴 기선 모두에 적용] 필드에 입력된 거리 값에 따라 전리층 모델 보정을 적용하기 위한 최소 기선 길이 또는 시발 값이 결정됩니다.

참조: 전리층 모델은 2 주파수 수신기로 관측된 기선에만 적용됩니다.

이 값을 편집하려면:

1.	[고급 스타일 편집] 대화 상자 를 엽니다.

2.	[전리층] 탭을 선택합니다.

3.	[모호 정수 결정 통과] 그룹에서 [다음 보다 긴 기선 모두에 적용] 체크 상자를 선택합니다.

이 체크 상자를 선택하면 GPS 처리기는 전리층 오차를 보정하기 위해 전리층 모델을 적용합니다. 전리층 보정 방법은 1 주파수 또는 2 주파수 데이터 중 어느 것이 프로젝트 데이터베이스에 존재하느냐 따라 자동으로 선택됩니다. 체크 상자를 선택하였을 때 다음 중 한가지가 실행됩니다.

 모든 프로젝트 데이터가 2 주파수 수신기를 이용하여 수집되었을 경우, GPS 처리기는 [다음 보다 긴 기선 모두에 적용] 필드에 지정 되어 있는 거리보다 긴 기선에 전리층 모델 보정을 적용 하여 관측 가능한 무전리층의 생성을 시도합니다. 전리층 보정은 코드 해에서 시작되고 모델링은 각 연속 해에 대해 점진적으로 향상됩니다.

 적어도 한 개의 데이터 파일이 1 주파수 수신기를 이용하여 수집되었을 경우, GPS 처리기는 전리층 오차의 50%을 제거하기 위해 방송 궤도력에 포함된 전리층 데이터를 사용합니다.

4.	[다음 보다 긴 기선 모두에 적용] 필드에 프로젝트 단위로 거리 값을 입력합니다.

기본값으로 모호 정수 결정 통과를 위한 전리층 모델 보정은 10 킬로미터 이상의 기선에 대해 이용 가능한 상태로 되어 있습니다.


[Timeline 요소]를 필터링 하려면

 개요 및 추가 정보

타임 스팬 뷰어에 나타나는 그래픽 요소를 필터링 하는 데 Timeline 도구 모음이나 메뉴의 명령들을 이용할 수 있습니다.

위성 궤도력 아이콘 필터링

타임 스팬 뷰어에 표시되는 위성 궤도력 아이콘을 필터링 하려면 [위성 궤도력] 명령을 선택합니다. 이 명령을 사용할 때마다 위성 궤도력 아이콘이 보이거나 숨겨집니다.

위성 궤도력 아이콘을 필터링 하려면 다음 중 한가지를 실행합니다:

 타임 스팬 뷰어 바탕을 오른쪽 마우스 단추로 클릭하고 [보기 필터 / 위성 궤도력]을 선택합니다.

 Timeline 도구 모음에서 [image] 을 클릭합니다.

연속 Kinematic 선점 세그먼트 필터링

Timeline 타임 스팬 뷰어에 표시되는 연속 세그먼트 요소를 필터링 하려면 [연속] 명령을 선택합니다. 이 명령을 사용할 때마다 [연속] 아이콘이 보이거나 숨겨집니다.

선점 세그먼트를 필터링 하려면 다음 중 한가지를 실행합니다:

 타임 스팬 뷰어 바탕을 오른쪽 마우스 단추로 클릭하고 [보기 필터 / 연속]을 선택합니다.

 Timeline 도구 모음에서 [image] 를 클릭합니다.

위성 및 관련된 GPS 관측치의 필터링

Time 스팬 뷰어에 표시되는 위성과 GPS 관측 요소를 필터링 하려면 [위성] 명령을 사용합니다. 이 명령이 사용될 때마다 위성 아이콘 및 GPS 관측치 요소가 보이거나 숨겨집니다.

위성을 필터링 하려면 다음 중 한가지를 실행합니다:

 타임 스팬 뷰어 바탕을 오른쪽 마우스 단추로 클릭하고 [보기 필터 / 위성]을 선택합니다.

 Timeline 도구 모음에서 [image] 를 클릭합니다.

이벤트 아이콘 필터링

타임 스팬 뷰어에 표시되는 이벤트를 필터링 하려면 [이벤트] 명령을 선택합니다. 이 명령이 사용될 때 마다 이벤트 아이콘이 보이거나 숨겨집니다. 이벤트 데이터가 프로젝트에 존재하고 있어야  이 단추가 활성화 됩니다.

이벤트를 필터링 하려면:

 Timeline 도구 모음에서 [image] 를 클릭합니다.


GPS 처리 목록에서 열을 이동하려면

 개요 및 추가 정보

GPS 처리 목록의 열을 목록의 새로운 위치로 이동시킬 수 있습니다. 이 열 이동은 임시적이고 차후의 GPS 처리 세션이 시작되었을 때는 원래 위치로 되돌아 갑니다.

열을 이동하려면:

1.	열의 헤더 위로 커서를 이동시킵니다.

헤더는 열의 제목을 포함하고 있고 데이터의 첫째 줄 위에 위치합니다.

2.	다음 중 하나를 실행합니다:

 열을 오른쪽으로 이동시키려면 헤더의 왼쪽 부분이 열을 삽입하고자 하는 위치를 넘어설 때까지 헤더를 오른쪽으로 끌기를 한 다음 마우스 단추를 놓습니다.

 열을 왼쪽으로 이동시키려면 헤더의 오른쪽 부분이 열을 삽입하고자 하는 위치를 넘어설 때까지 헤더를 왼쪽으로 끌기를 한 다음 마우스 단추를 놓습니다.


타임 스팬 뷰어를 이용하여 Timeline을 탐색 하려면

타임 스팬 뷰어화면에서 timeline을 이동시키려면 다음의 방법을 사용합니다.

 스크롤 바를 사용하여 timeline을 좌우로 이동시킵니다.

 [시작 시간] 또는 [정지 시간] 필드를 조절하여 특정 시간대로 이동합니다.

 전체 timeline을 보려면 [전체 보기] 명령을 사용합니다.

 선택된 요소를 타임 스팬 뷰어의 너비로 확대하려면 [스팬 범위 보기] 명령을 사용합니다.

 다음 선점 끝 포인트로 이동하려면 [다음] 명령을 사용합니다.

 이전 선점 시작 포인트로 이동하려면 [이전] 명령을 사용합니다.

데이터를 수직으로 보려면 다음 방법을 사용합니다:

 더 많은 정보를 보거나 더 적은 정보를 보기 위해 Timeline 보기 영역의 위쪽 가장자리를 위쪽 또는 밑쪽으로 끌기를 합니다.

 더 많은 정보를 보려면 제어 표시줄에 있는 데이터 폴더를 열고 닫습니다.

 수직 스크롤 바를 이용하여 데이터를 상하로 이동합니다.

다음의 지침을 참조하시기 바랍니다:

 대부분의 Timeline 요소는 두 번 클릭하면 그 Timeline 요소가 가지고 있는 등록 정보가 나타납니다.

 대부분의 Timeline 요소나 창 바탕을 마우스 오른쪽 단추로 클릭하면 명령 메뉴가 나타납니다. 각 메뉴는 선택된 창 또는 요소에 해당되는 명령을 가지고 있습니다.

 Timeline의 특정 내역의 표시는 해당 요소를 선택하였을 때 만 나타납니다. 위성 플롯 메뉴는 위성 아이콘을 선택했을 때 메뉴 명령으로, 또는 활성 도구 모음 단추로만 표시됩니다. 이와 유사하게 DOP 플롯 및 하늘 플롯 명령도 선점, 측량, 또는 위성 궤도력 아이콘이 선택되었을 때 메뉴 및 도구 모음 단추에서만 이용할 수 있습니다.

추가 정보는 다음 항목을 참조하시기 바랍니다:

 이전 또는 다음 선점 보기

 Timeline 데이터 폴더

 Timeline 메뉴

 Timeline 도구 모음

 기타 Timeline 표시

 [Timeline 등록 정보] 대화 상자

 Timeline 명령


원시 위성 추적 정보를 플로팅 하려면

 개요 및 추가 정보

원시 위성 추적 정보는 대화 상자 표시줄의 단추를 선택하거나 [보기 / 데이터] 메뉴의 옵션을 선택 함으로서 위성 플롯에 플로팅 됩니다. 데이터를 플로팅 할 수 있을 뿐만 아니라, 플롯을 인쇄할 수도 있고 위성으로부터 수집된 정보를 파일로 출력하여 플롯을 문서화 할 수도 있습니다.

위성 추적 데이터를 플로팅 하려면:

1.	Timeline을 보기 위해 다음 중 한가지를 실행합니다:

 보기 / Timeline을 선택합니다.

 Alt+VI를 누릅니다.

Timeline 보기 영역 이 나타납니다.

2.	데이터 폴더를 클릭합니다.

데이터 폴더가 Timeline 보기 영역의 아래 왼쪽 코너에 있는 제어 표시줄에 나타나고 데이터 폴더가 닫혀있을 때는 [image] 기호가 나타나고 열려 있을 때는 [image] 기호가 나타납니다. 데이터 폴더에는 데이터 수집 시 사용된 수신기의 종류(모델 번호)와 일련 번호가 표시됩니다. 데이터 폴더를 열면 선점 타임 스팬 동안 추적된 모든 위성들의 아이콘이 나타납니다.

참조: 폴더를 각각 열지 않고 [모두 개방] 명령을 사용하여 모든 데이터 폴더를 열 수 있습니다.

3.	위성 아이콘을 두 번 클릭합니다.

위성 아이콘에 색깔이 칠해지고 위성 플롯 창이 나타납니다.

4.	데이터를 플로팅 하려면 다음 중 한가지를 실행합니다:

 대화 상자의 표시줄에서 원하는 단추를 클릭합니다.

 보기 / 데이터 메뉴에서 원하는 플롯 명령을 선택합니다.

일단 플롯이 표시되면 다음과 같은 작업을 수행할 수 있습니다:

플롯 관측값을 표시하려면:

 마우스 커서를 플롯 위의 원하는 위치로 이동하고 상태 표시줄에서 관측값과 시간 정보를 읽습니다. 마우스가 위치하고 있는 곳의 플롯 관측값과 데이터가 수집된 시간이 상태 표시줄에 표시됩니다.

동일 창에 다른 플롯을 플로팅 하려면:

 대화 상자 표시줄에서, 또는 [보기 / 데이터] 서브 메뉴에서 원하는 플롯 명령을 선택합니다.

선택된 데이터가 첫번째 플롯과 함께 동일 플롯 창에 플로팅 됩니다.

플롯을 인쇄하려면:

1.	다음 중 한가지를 실행합니다:

 파일 / 인쇄를 선택합니다.

 Ctrl+P를 누릅니다.

 도구 모음에서 [image] 를 클릭합니다.

[인쇄] 대화 상자가 나타납니다.

2.	원하는 옵션을 선택합니다.

3.	확인을 클릭합니다.

플롯이 인쇄됩니다

플롯을 파일로 출력하려면:

1.	다음 중 한가지를 실행합니다:

 파일 / 인쇄를 선택합니다.

 Ctrl+P를 누릅니다.

 도구 모음에서 [image] 를 클릭합니다.

[인쇄] 대화 상자가 나타납니다.

2.	[파일로 인쇄] 옵션을 선택합니다.

3.	확인을 클릭합니다.

플롯이 파일로 출력됩니다. 많은 프로그램의 경우 파일로 출력된 그래픽 데이터는 [가져오기] 작업을 할 수 있습니다. 이 기능은 보고서에 플롯을 포함시킬 때 유용하게 사용할 수 있습니다.

표 데이터를 인쇄하려면:

1.	다음 중 한가지를 실행합니다:

 파일 / 내보내기를 선택합니다.

 Alt+FE를 누릅니다.

[다음 이름으로 저장] 대화 상자가 나타납니다.

2.	파일을 저장할 폴더와 파일 이름을 선택합니다.

플롯을 만드는데 사용된 위성 추적 정보는 텍스트 (*.txt) 파일로 작성되어 선택한 폴더에 저장됩니다. 이 데이터는 표 형식의 파일로 작성됩니다. 여러 개의 플롯이 동일 위성 플롯 창에 표시될 경우 각 플롯 형식마다 하나의 표 데이터 열이 작성됩니다.

참조: 파일 / 새 플롯 명령을 이용하여 추가로 플롯 창을 열 수 있습니다. 각 창은 각각 다른 플롯 세트를 표시할 수 있습니다. 창을 최소 및 최대로 만들 수 있고 위성 플롯에 표시되는 창을 조절하는 다른 일반 명령도 실행할 수 있습니다.


[Timeline 보기 영역]을 인쇄하려면

 개요 및 추가 정보

Timeline 보기 영역의 내용을 세로방향 또는 가로 방향 모드로 인쇄할 수 있습니다.

참조: 인쇄하기 전에 보기 영역의 크기를 조정합니다. 왜냐하면 현재 보기 영역에 나타나는 데이터만 인쇄되기 때문입니다.

Timeline 보기 영역을 인쇄하려면:

1.	Timeline을 보기 위해 다음 중 한가지를 실행합니다:

 보기 / Timeline을 선택합니다.

 Alt+VI를 누릅니다.

2.	제어 표시줄, 타임 스팬 뷰어, 또는 시간자의 바탕을 클릭합니다.

3.	[인쇄] 대화 상자를 보기 위해 다음 중 한가지를 실행합니다:

 파일 / 플롯/인쇄를 선택합니다.

 Ctrl+P를 누릅니다.

[인쇄] 대화 상자가 나타납니다.

4.	보기 영역을 인쇄하기 위해 다음 중 한가지를 실행합니다:

 세로방향 모드로 보기 영역을 인쇄하려면 확인을 클릭합니다.

 가로 방향 모드로 보기 영역을 인쇄하려면 [등록 정보]를 클릭하고 가로 방향을 선택한 후 확인을 클릭하고, [인쇄] 대화상자에서 다시 한번 확인을 클릭합니다.

Timeline 보기 영역은 자동으로 종이의 너비와 길이에 맞게 변경되어 인쇄됩니다.


기선을 처리하려면

 개요 및 추가 정보

기선 처리는 각각의 기선 또는 여러 개의 기선을 선택하여 처리 할 수 있습니다.

모든 기선을 처리하려면:

1.	원시 GPS 데이터 파일을 가지고 있는 프로젝트를 엽니다.

2.	그래픽 창 배경을 클릭합니다.

어떠한 데이터도 플로팅 되어 있지 않은 곳을 클릭하여야만 합니다. 이 동작은 모든 선택된 아이템을 선택에서 해제 합니다. 그래픽 창에서 어떠한 기선도 선택하지 않았을 경우 기선 처리기는 모든 잠재 기선을 자동으로 선택하여 처리 대상으로 합니다.

3.	기선을 처리하기 위해 다음 중 한가지를 실행합니다:

 [측량] 메뉴에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄에 있는 [Trimble Survey] 그룹에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄에 있는 [처리] 그룹에서 [GPS 기선 처리]를 선택합니다.

 F9를 누릅니다.

참조: GPS 처리 도중 언제라도 취소를 눌러서 세션을 취소할 수 있습니다.

GPS 처리 세션이 계속됨에 따라 상태 정보가 상태 표시줄에 표시됩니다. 다음의 통계가 표시됩니다:

 상태 표시줄의 왼쪽 편에 있는 진행 표시기가 각 기선 처리 해의 진행상황을 보여줍니다.

 두 번째 표시기는 GPS 처리기에 의해 생성되는 메시지를 보여줍니다. 세션이 진행됨에 따라 각 기선의 시점과 종점이 표시됩니다.

 오른쪽에서 세 번째의 상태 표시줄에 처리할 파일의 총수와 미처리한 기선의 수가 표시됩니다. 이 표시기는 모든 기선이 처리된 후, 그리고 저장을 클릭하여 프로젝트에 해를 저장하기 전에는 [미저장]이라는 말을 표시합니다.

 가장 오른쪽의 상태 표시기는 수용된 기선 해 수와 기각된 기선 해 수를 표시합니다.

GPS 처리 세션이 진행됨에 따라 선택된 각 기선의 처리 결과가 GPS 처리 목록에 요약된 형태로 표시됩니다. GPS 처리 목록의 왼쪽 열에 나타나는 체크 표시로 어떤 것이 수용된 기선 해인지 알 수 있습니다.

플래그가 있는 해를 가지고 있는 각 기선은 그래픽 창에서 붉은 플래그로 표시됩니다.

선택한 여러 개의 기선을 처리하려면:

1.	그래픽 창에서 다음 중 한가지 방법을 사용하여, 처리하고자 하는 기선을 선택합니다:

 여러 개의 기선을 마우스로 직사각형을 그려 선택 합니다.

 Ctrl 키를 누른 채로 여러 개의 기선을 클릭합니다.

팁: Ctrl 키를 누른 채로 다시 한번 기선을 클릭 하면 기선의 선택이 해제됩니다.

2.	기선을 처리하기 위해 다음 중 한가지를 실행합니다:

 [측량] 메뉴에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄에 있는[Trimble Survey] 그룹에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄의 [처리] 그룹에서 [GPS 기선 처리]를 선택합니다.

 F9를 누릅니다.

[GPS 처리] 대화 상자가 나타나고 처리가 시작됩니다.

일단 기선이 처리되면, GPS 기선 처리 보고서를 볼 수 있고 각 기선 해의 결과를 분석할 수 있습니다. 추가 정보는 GPS 기선 처리 보고서 분석을 참조하시기 바랍니다.

각 해에 대한 보고서 데이터를 검토한 후 기선 해를 저장할 수 있습니다.

참조: 기선을 처리하고 [GPS 처리] 대화 상자를 닫은 후 측량 보기 상태 표시줄에 있는 경고 플래그 표시기를 두 번 클릭할 수 있습니다. 이렇게 두 번 클릭하면 관련된 경고 플래그를 가진 기선들을 표시하는 등록 정보 창이 열립니다. 선택 부분 목록에서 기선 폴더를 열어 이 기선에 플래그가 있는 원인을 찾을 수 있습니다. 경고 페이지에서는 잘못된 내용 즉, 비율, RMS, 기준 분산 수용 기준, 또는 루프 폐합 실패와 같은 기선 플래그의 다른 원인을 보여줍니다. 왜 기선이 플래그 되었는가를 이해 함으로서 동일한 문제가 다시 발생하지 않도록 해줍니다. 추가 정보는 GPS 기선 처리 보고서 분석을 참조하시기 바랍니다.

GPS 데이터를 처리하는 데는 많은 고려 사항이 있습니다. GPS 기선 처리에 대한 추가 정보는 다음 항목을 참조하시기 바랍니다:

 잠재 기선 결정

 처리할 기선 선택

 GPS 처리 스타일 선택

 기선 처리기 시작

 처리 결과 보기

 처리 결과 저장

 기선 재처리


문제가 있는 기선을 재처리 하려면

 개요 및 추가 정보

문제를 해결하는 기술은 관측 세션 시간의 길이와 관련이 있습니다. 문제가 있는 기선이 충분한 데이터를 가지고 있고, 충분한 수의 위성을 보이고 있을 경우에는 세션의 시작 또는 마지막 부분에서 선점 시간을 줄입니다. 이 과정은 세션의 시작 부분이나 끝 부분의 데이터에 잡음이 많을 때 또는 사이클 슬립으로 채워져 있을 때 특히 유용합니다.

기선을 재처리 하려면:

1.	Timeline을 보기 위해 다음 중 한가지를 실행합니다:

 보기 / Timeline을 선택합니다.

 Alt+VI를 누릅니다.

2.	측량 데이터를 가지고 있는 데이터 폴더를 확장 시킵니다.

3.	해당 GPS 관측치를 마우스 오른쪽 단추로 클릭합니다.

4.	[등록 정보]를 선택합니다. [GPS 관측치 등록 정보] 대화 상자가 나타납니다.

5.	새로운 [시작 시간] 또는 [정지 시간]을 입력합니다.

6.	확인을 클릭합니다.

7.	문제가 있는 기선을 클릭합니다.

8.	기선을 처리하기 위해 다음 중 한가지를 실행합니다:

 [측량] 메뉴에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄의 [Trimble Survey] 그룹에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄의 [처리] 그룹에서 [GPS 기선 처리]를 선택합니다.

 F9를 누릅니다.

각 기선 해가 재 계산되어 그 결과가 [기선 처리] 대화 상자에 표시됩니다.


Timeline에서 선점을 선택하려면

 개요 및 추가 정보

그래픽 창과 Timeline은 서로 연결되어 있습니다. 그래픽 창 또는 Timeline 보기 영역에서 요소들을 선택할 때 다음 설명을 고려하시기 바랍니다.

 Timeline에서 선점을 선택한 경우 선택된 포인트는 그래픽 창에서도 선택됩니다.

 그래픽 창에서 기선을 선택한 경우Timeline은 기선을 구성하는 두 선점을 선택합니다.

 그래픽 창에서 하나의 포인트를 선택한 경우Timeline은 이 포인트와 관련된 모든 선점을 선택합니다.

다양한 종류의 선점을 구별하고 타임 스팬 뷰어에 표시되는 데이터 세그먼트를 구별하는데 색상 코드 구성표를 사용합니다. 추가 정보는 색상 코드 구성표를 참조하시기 바랍니다.

Timeline에서 선점을 선택하려면:

 선점을 클릭합니다.

기선이 강조되어서 선택 되었다는 것을 보여줍니다.

그래픽 창에서 기선을 선택하는 방법으로 선점을 선택하려면:

 그래픽 창에서 기선을 클릭합니다.

기선과 관련되는 두 선점이 타임 스팬 뷰어에서 선택됩니다.

그래픽 창에서 포인트를 선택하는 방법으로 선점을 선택하려면:

 그래픽 창에서 해당 포인트를 마우스로 직사각형을 그려 선택합니다.

이 포인트와 관련된 선점이 타임 스팬 뷰어에서 선택됩니다.

팁: 관측치 및 포인트는 또한 등록 정보 창으로부터 선택할 수 있고 그 반대로도 할 수 있습니다. Timeline또는 그래픽 창에서 작업하는 동안 선택된 개체의 등록 정보를 보기 위해서 등록 정보 창을 열어 둘 수도 있습니다.


GPS 기선 처리 보고서를 설정하려면

GPS 기선 처리 보고서의 섹션을 이용 상태 또는 불이용 상태로 만들어 보고서 내용을 조절할 수 있습니다.

보고서를 설정하려면:

1.	[GPS 기선 처리 보고서 설정] 대화 상자를 보기 위해서 다음 중 한가지를 실행합니다:

 보고서 / 설정 / GPS 기선 처리 보고서를 선택합니다.

 Alt+RSO를 누릅니다.

[GPS 기선 처리 보고서 설정] 대화 상자가 나타납니다.

2.	체크 상자를 선택하거나 선택을 해제하여 GPS 기선 처리 보고서에 포함할 섹션을 조절합니다.


GPS 처리를 시작하려면

 개요 및 추가 정보

GPS 처리를 시작하려면:

1.	[측량 보기]에서 원하는 기선을 선택합니다. 어떠한 것도 선택하지 않았을 경우에는 모든 잠재 기선이 선택되어 처리됩니다.

2.	다음 중 한가지를 실행합니다:

 [측량] 메뉴에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄의 [Trimble Survey] 그룹에서 [GPS 기선 처리]를 선택합니다.

 프로젝트 표시줄의 [처리] 그룹에서 [GPS 기선 처리]를 선택합니다.

 F9를 누릅니다.

[GPS 처리] 대화 상자가 열리고 처리가 시작됩니다.

참조: GPS 처리 세션을 취소하려면 언제라도 취소를 클릭합니다.

GPS처리 세션이 계속됨에 따라 처리상태 정보가 상태 표시줄에 표시됩니다. 다음의 통계가 표시됩니다:

 상태 표시줄의 왼쪽 편에 있는 진행 표시기가 각 기선 처리 해의 진행상황을 보여줍니다.

 두 번째 표시기는 GPS 처리기에 의해 생성되는 메시지를 보여줍니다. 세션이 진행됨에 따라 각 기선의 시점과 종점이 표시됩니다.

 오른쪽에서 세 번째의 상태 표시줄에 처리할 파일의 총수와 미처리한 기선의 수가 표시됩니다. 이 표시기는 모든 기선이 처리된 후, 그리고 저장을 클릭하여 프로젝트에 해를 저장하기 전에는 [미저장]이라는 말을 표시합니다.

 가장 오른쪽의 상태 표시기는 수용된 기선 해 수와 기각된 기선 해 수를 표시합니다. 수용 기준은 [GPS 처리 스타일 대화 상자]에 설정되어 있습니다.

GPS 처리 세션이 진행됨에 따라 각 선택된 기선의 처리 결과가 GPS 처리 목록에 요약된 형태로 표시됩니다. GPS 처리 목록의 왼쪽 열에 나타나는 체크 표시로 어떤 것이 수용된 기선 해인지를 알 수 있습니다. 기선이 질 수용 테스트 기준을 통과하지 못한 경우 체크 표시가 나타나지 않습니다.

플래그가 있는 기선들이 통과되고 그들의 해가 저장됩니다. GPS 처리 세션이 종료되면 이들을 검사하여 그들이 왜 질 수용 기준을 통과하지 못했는지 원인을 살펴봅니다. 플래그가 있는 기선은 그래픽 창에서 붉은 플래그로 표시됩니다.

처리 세션을 저장하기 전에 특정 기선을 기각 하려면.

1.	GPS 처리 목록에서 원하는 기선 해를 선택합니다.

2.	왼쪽 열의 체크 상자 선택을 해제합니다.

개별 기선 해의 GPS 기선 처리 보고서를 보려면:

1.	GPS 처리 목록에서 원하는 기선 해를 선택합니다.

2.	보고서를 클릭합니다. GPS 기선 처리 보고서가 나타납니다.

추가 정보는 GPS 기선 처리 보고서를 참조하시기 바랍니다.

3.	필요 시 이 과정을 반복하여 기타 보고서를 볼 수 있습니다

팁: GPS 처리 후에 기선에 대한 GPS 기선 처리 보고서를 볼 수 있습니다. 그래픽 창에서 원하는 기선을 선택한 다음, 보고서 / GPS 기선 처리 보고서를 선택합니다.

모든 수용된 기선 해는 프로젝트에 저장할 수 있습니다.

[중복 기선 해 덮어쓰기] 체크 상자는 재처리 후 기선이 저장되는 방법을 조절합니다. 기본값이 선택되어 있습니다. 다시 말해서 기존 해가 덮어 쓰여지도록 되어 있습니다. 체크 상자의 선택을 해제하였을 경우, 새로운 해가 프로젝트에 추가되고 이전 해는 그대로 보존됩니다. 이 상황이 발생하면 새로운 해는 활성 해가 되고 이전 해는 비활성으로 됩니다. 등록 정보 창을 이용하여 이전 해를 활성해로 되돌릴 수 있습니다.

[중복 기선 해 덮어쓰기] 체크 상자는 두 번 이상 처리된 기선에만 적용됩니다. 이것은 다른 시간 또는 다른 날에 수집된 GPS 데이터로부터 계산된 동일한 두 포인트 간의 기선에는 영향을 미치지 않습니다. 중복된 기선 해는 항상 덮어쓰기 할 것을 권장합니다.

기선 해를 저장하려면:

 저장을 클릭합니다.

수용된 기선 해가 프로젝트에 저장됩니다.

GPS 처리 세션을 취소하려면:

 취소를 클릭합니다.

GPS 데이터를 처리하는 데는 많은 고려 사항이 있습니다. GPS 기선 처리에 대한 추가 정보는 다음 항목을 참조하시기 바랍니다.

 잠재 기선 결정

 처리할 기선 선택

 GPS 처리 스타일 선택

 기선 처리기 시작

 처리 결과 보기

 처리 결과 저장

 기선 재처리


임계 앙각 설정 문제를 해결하려면

 개요 및 추가 정보

선택된 위성 또는 GPS 관측치 데이터를 불이용 상태로 만든 후에도 기선 통계가 향상되지 않을 경우 이 문제 해결 방법을 사용합니다. 임계 앙각을 증가 시킴으로 잡음이 많은 데이터를 제거하고 기선 통계를 향상 시킬 수 있습니다. 임계 앙각을 증가 시키는 데는 시행 착오 접근 방식을 사용합니다. 양호한 데이터의 손실을 피하기 위해 각도를 1도 씩 증가 시킵니다.

앙각을 평가하려면:

1.	Timeline을 보기 위해 다음 중 하나를 실행합니다:

 보기 / Timeline을 선택합니다.

 Alt+VI를 누릅니다.

Timeline이 나타납니다.

2.	문제가 있는 기선의 계산과 관련된 개별 위성을 보기위해 데이터 폴더의 [image] 기호를 클릭합니다.

3.	위성 아이콘을 마우스 오른쪽 단추로 클릭합니다.

4.	[위성 플롯]을 선택합니다.

5.	위성에 대한 앙각의 변화를 보기위해 [앙각] 탭을 클릭합니다.

6.	임계 앙각을 증가 시켰을 경우 처리 결과가 향상되는지를 파악하기 위해 기선과 관련된 모든 위성에 대해 위 과정을 반복합니다.

앙각을 증가 시키려면:

1.	[GPS 처리 스타일] 대화 상자를 부르기 위해 측량 / GPS 처리 스타일을 선택합니다. [GPS 처리 스타일] 대화 상자가 나타납니다.

2.	목록에서 스타일을 선택합니다.

3.	편집을 클릭합니다. [스타일 편집] 대화 상자가 나타납니다.

4.	[임계 앙각] 필드에 새로운 임계 앙각 값을 입력합니다.

5.	대화 상자들이 모두 닫힐 때까지 한번 또는 반복해서 확인을 클릭합니다.

6.	기선을 클릭합니다.

7.	기선을 처리하기 위해서 다음 중 한가지를 실행합니다:

 측량 / GPS 기선 처리를 선택합니다

 F9를 누릅니다.

각 기선이 재 처리됩니다.

8.	결과를 점검 합니다.

이러한 문제 해결 방법을 사용한 후 기선 통계가 향상되었는지를 확인합니다.


GPS 처리에 기상 관측 데이터를 이용하려면

 [기상 관측 데이터 이용] 체크 상자는 대류권 보정을 위해서는 기선 처리 중에 기상 관측 데이터를 반드시 사용하도록 지정하기 위해 사용됩니다.

참조: 다음 과정의 설명은 고급 스타일 편집 대화 상자가 나타나 있는 것을 전제로 합니다.

기상 데이터의 이용을 이용 상태 또는 불이용 상태로 만들려면:

1.	[대류권] 탭을 선택합니다. 대류권 스타일 설정이 나타납니다.

2.	[기상 관측 데이터 이용] 체크 상자를 선택하여 GPS 처리 해를 계산할 때 적용되는 기상 데이터의 형식을 선택합니다. 기상 데이터는 상대 습도, 기압, 온도로 구성되어 있습니다. 다음의 지침을 고려하시기 바랍니다.

 이 체크 상자를 선택하면 GPS 데이터 파일 (.dat) 내의 기상 관측 데이터, 또는 RINEX 파일과 함께 가져온 기상 관측 데이터가 대류권 천정 지연을 계산할 때 대류권을 모델링 하는데 사용됩니다. 기본값으로 이 체크 상자는 선택 되어 있습니다

 기록된 기상 데이터 자리에 표준 기상 값을 사용하려면 이 옵션을 해제합니다.

참조: 현장에서 기상 데이터를 기록할 때, 판독 값이 정확하도록 하려면 캘리브레이션 된 고품질의 장비를 사용하는 것이 중요합니다. 캘리브레이션 되지 않은 장비나 질이 좋지 않은 장비를 사용하여 얻은 기상 데이터는 기선 해의 질을 감소 시킬 수 있습니다.


Timeline에서 위성 궤도력 등록 정보를 보려면

 개요 및 추가 정보

데이터 수집 세션 동안 각 위성에서 수집한 방송 위성 궤도력에서 도출된 정보는 Timeline에서 이용할 수 있습니다. 정보를 보기 전에 반드시 해당되는 데이터 폴더가 열려 있어야 합니다.

대화 상자 내의 위성 궤도력 정보는 방송 위성 궤도력으로부터 도출되며 편집할 수 없습니다. [URA] 및 [양호상태] 필드의 메시지는 위성으로부터 전송된 데이터의 질을 표시해 주기 때문에 특히 중요합니다.

위성 궤도력 등록 정보를 보려면 다음 중 한가지를 실행합니다:

 위성 궤도력 아이콘을 두 번 클릭합니다.

 Timeline 도구 모음에서 [image] 를 클릭합니다.

[위성 궤도력 등록 정보] 대화 상자가 나타납니다.


Timeline에서 선점 등록 정보를 보려면

 개요 및 추가 정보

연속 세그먼트 및 static 선점의 등록 정보는 [선점/데이터 세그먼트 등록 정보] 대화 상자에서 볼 수 있습니다. 이 대화 상자 옵션은 선택된 선점 유형을  반영하기 위해 자동으로 업데이트 됩니다.

선점 등록 정보를 보려면:

1.	원하는 선점 요소를 두 번 클릭합니다. [선점/데이터 세그먼트 등록 정보] 대화 상자가 나타납니다.

2.	등록 정보를 본 후 확인을 클릭합니다.

참조: 세그먼트 형식, 선점의 시작 및 정지시간, 안테나 등록 정보 등을 포함하는 선택된 등록 정보를 편집 할 수 있습니다.


Timeline에서 GPS 관측치 등록 정보를 보려면

 개요 및 추가 정보

Timeline이 화면에 나타나면 기본적으로 위성 필터가 작동됩니다. 이 필터 기능을 중지시켜 GPS 관측치를 숨길 수 있습니다.

도구 모음에서 GPS 관측치를 필터링 하려면:

 Timeline 도구 모음에서 [image] 를 클릭합니다.

GPS 관측치가 표시되어 있을 경우에는 숨겨지고, 숨겨져 있었을 경우에는 나타납니다.

타임 스팬 뷰어에서 GPS 관측치를 필터링 하려면:

1.	타임 스팬 뷰어 바탕을 오른쪽 마우스 단추로 클릭합니다.

2.	보기 필터 / 위성을 클릭합니다.

GPS 관측치가 표시되어 있을 경우에는 숨겨지고 숨겨져 있었을 경우에는 나타납니다.


Timeline에서 다음 또는 이전 측량 세그먼트를 보려면

 개요 및 추가 정보

Timeline 도구 모음 상에 청색 화살표 단추로 표시되어 있는 [다음] 및 [이전] 명령은 타임 스팬 뷰어를 다음 또는 이전의 선점으로 이동시키되, 선점의 시작 또는 종료 포인트로 이동 시켜줍니다. Timeline이 길어 선점 간에 이동이 용이하지 않을 때 이 명령이 특히 유용합니다.

 [다음] 또는 [이전] 명령을 사용하려면:

1.	타임 스팬 뷰어에서 선점 요소를 선택합니다.

2.	[다음] 또는 [이전] 명령을 선택하기 위해 다음 중 한가지를 실행 합니다:

 마우스 오른쪽 단추로 선점을 클릭한 후 [다음] 또는 [이전]을 클릭합니다.

 Timeline 도구 모음에서 [image] 또는 [image] 을 클릭합니다.

[다음]을 선택하였을 경우 타임 스팬 뷰어는 다음 선점의 마지막 점으로 이동합니다. [이전]을 선택하였을 경우에는 시간 스팬 뷰어가 이전의 선점으로 이동합니다.

참조: [선점/데이터 세그먼트 등록 정보] 대화 상자는 두개의 스핀 단추를 가지고 있습니다. 왼쪽 스핀 단추는 [이전] 명령처럼 작동하고 오른쪽 단추는 [다음] 명령처럼 작동합니다. 이 두 단추는 사용자로 하여금 타임 스팬 뷰어를 이전 또는 다음 선점으로 이동할 수 있게 해주고, 각 선점의 등록 정보를 동시에 볼 수 있도록 해줍니다.

팁: 등록 정보 창에서 선점과 관련된 관측치 또는 포인트를 선택 함으로서 타임 스팬 뷰어를 이동할 수도 있습니다. 등록 정보 창에서 관측치 또는 포인트를 선택하면 해당되는 [측량] 요소를 자동으로 선택 하고 타임 스팬 뷰어를 관련된 선점 요소로 이동시켜 줍니다. Timeline에서 작업하는 동안 등록 정보 창이 표시되도록 하였을 경우, 사용자는 선점과 관련된 관측치와 포인트의 등록 정보를 볼 수 있습니다.


기선 통계를 보려면

 개요 및 추가 정보

기선 통계를 볼 수 있는 방법에는 몇 가지가 있습니다. 기선 통계는 GPS 처리 세션 진행 중에, 또는 완료 후에 볼 수 있습니다.

[GPS 처리] 대화 상자에서 기선 통계를 보려면:

1.	GPS 처리를 시작합니다.

[GPS 처리] 대화 상자가 나타나고 처리 세션이 시작됩니다. 처리기가 실행을 진행하면 각각의 해가 GPS 처리 목록에 표시됩니다. 추가 정보는 기선 처리를 참조하시기 바랍니다.

2.	각 기선에 대한 비율, 기준 분산, RMS 열을 살펴봅니다.

이 열은 비율, 기준 분산, RMS 테스트 결과를 보여줍니다. 보고된 결과가 GPS 처리 스타일에 지정된 수용 기준 내일 경우의 기선 해는 수용이 되고, 목록의 첫번째 열에 체크 표시가 나타납니다. 이용 가능 상태의 테스트 중 어느 하나에서라도 불량한 결과를 보이면 첫번째 열에 체크 표시가 나타나지 않습니다.

참조: 플래그가 있는 기선도 프로젝트에 수용되지만 그래픽 창에 붉은색 경고 플래그가 나타납니다. 기선이 수용 기준을 통과하지 못한 원인을 찾기 위해 플래그가 있는 기선의 등록 정보를 검사하고 이 결함을 보정하기 위해서 적절한 조치를 취해야 합니다. 추가 정보는 등록 정보 창을 참조하시기 바랍니다.

3.	어떤 해에 대한 GPS 기선 처리 보고서를 보려면, 목록에서 해를 선택하고 보고서를 클릭합니다. GPS 기선 처리 보고서가 나타납니다.

팁: 기선을 두 번 클릭하여 보고서를 볼 수도 있습니다. GPS 처리 세션이 완료되도록 기다렸다가 보고서를 볼 필요는 없습니다. 개별 기선에 대한 보고서를 읽는 동안 기선 처리는 계속 진행됩니다.


GPS 기선 처리 보고서를 보려면

 개요 및 추가 정보

기선의 GPS 기선 처리 보고서는 기선 처리가 시작되면서 바로 볼 수 있습니다. 기선 처리 결과는 GPS 처리 목록에 표시됩니다. 사용자가 GPS 기선 처리 보고서를 검토하는 동안 처리기는 기선 처리를 계속합니다.

GPS 기선 처리 보고서를 보려면:

1.	GPS 기선 처리 보고서를 보기 위해서 다음 중 한가지를 실행합니다:

 [GPS 처리] 대화 상자의 기선 해를 두 번 클릭합니다.

 기선을 선택하고 보고서를 클릭합니다.

GPS 기선 처리 보고서가 나타납니다.

2.	보고서를 위 아래로 스크롤 하여 데이터를 검토합니다.

한 줄로 된 요약에는 나타나 있지 않은 기선 해의 내역을 검토합니다.

사용자의 필드 비고에 있는 정보와 상반되는 해의 스테이션 정보를 점검합니다. 다음과 같은 사항에 특별히 주의를 합니다:

 스테이션 이름

 안테나 높이, 종류, 측정 방법

 시작 및 정지 시간

L1 또는 L2 신호의 중단이나 갭을 찾기 위해 각 스테이션의 위성 위상 추적 요약을 점검합니다. 실 선은 깨끗한 신호를 표시합니다. 선에 갭이나 중단된 곳이 있으면 사이클 슬립 이나 위성 신호 손실이 있음을 의미합니다. 체크 표시는 수신기가 사이클 슬립 후에 위성 신호를 수신한 때를 나타냅니다.

결합 위성 위상 추적 요약을 점검하시기 바랍니다. 희미한 회색은 실제로 기선 해에 사용된 측정치를 나타냅니다.

각 위성의 잔차 플롯을 점검하시기 바랍니다. 이들은 기선 해의 결정에 사용된 각 위성의 RMS를 보여줍니다.


    [GPS 기선 처리] 명령

추가 정보

방법…	대화 상자
GPS 기선 처리 세션을 시작하려면 이 명령을 이용합니다:

  [측량 / GPS 기선 처리]를 선택합니다. [GPS  처리] 대화 상자가 나타나고 GPS 처리 세션이 시작됩니다.


    [GPS 기선 처리 보고서] 명령

추가 정보

방법…	기타
GPS 기선 처리 보고서를 보려면 이 명령을 이용합니다:

1.	보고서 작성을 원하는 대상 기선을 선택합니다.

2.	[보고서 / GPS 기선 처리 보고서]를 선택합니다. GPS 기선 처리 보고서가 나타납니다.

이 보고서는 이전 GPS 처리 세션의 처리 결과를 보여 줍니다. 기선 처리 해의 결과를 분석하려면 이 보고서를 이용하시기 바랍니다.

참조: GPS 기선 처리 보고서는 [GPS 처리] 대화 상자에서도 작성할 수 있습니다. GPS 처리 목록에서 각각의 기선 해를 선택한 후 [보고서]를 클릭 함으로서 기선 보고서를 볼 수 있습니다.


    [Timeline] 명령

추가 정보

 기타

Timeline 보기 영역을 열기 위해서는 [측량 보기]에서 다음 중의 한가지를 실행합니다:

  [보기 / Timeline]을 선택합니다.

  도구 모음에서 [image] 을 선택합니다.

Timeline 보기 영역이 그래픽 창의 아래 부분에 나타납니다.

Timeline은 프로젝트의 GPS 측정치에 대한 정보를 그림과 시간 형식으로 표시합니다. 각 데이터에 관한 분야별 정보는 Timeline 상의 여러 해당 위치에 표시됩니다. Timeline은 [측량 보기]에서 만 이용할 수 있습니다.


 [스타일 편집] 대화상자 - 개요

추가 정보

 방법 ...

개요

이 대화상자는 GPS 데이터 처리 방법을 설정하기 위해서 이용합니다.

[스타일 편집] 대화상자를 열려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  목록에서 스타일을 선택합니다.

3.  편집을 누르면 [스타일 편집] 대화상자가 나타납니다.

보다 상세한 조건을 설정하여 GPS 기선 처리기를 이용하려면 고급을 누릅니다. 고급 스타일 편집 대화상자가 나타납니다.

임계 앙각

GPS 기선 처리를 위한 최소 위성고도 설정을 하려면 이 필드를 편집합니다. 이 설정이 현장에서 관측 데이터 수집을 위해 이용한 임계 앙각보다 우선합니다.

다음의 지침을 참고하시기 바랍니다:

  기선 처리 결과를 계산할 때, Trimble Geomatics Office 소프트웨어는 이 고도 위의 위성만을 이용합니다. 이 값은 돗수로 입력해야 하며 기본값은 13도입니다.

  현장에서 관측 데이터 수집을 위해 이용한 임계 앙각보다 높거나 낮게 설정할 수 있으며, 보통은 높게 설정합니다. 필드에서 이용한 값보다 낮게 설정하면 처리에 영향을 미치지 않습니다.

  이 설정은 관측 데이터 수집을 위해서 여러 개의 수신기가 사용되고 임계 앙각이 수신기 마다 각각 다르게 설정되었을 경우에 유용합니다. 기선 처리를 할 때 각각 다르게 설정된 임계 앙각들을 무시하고 이 필드에서 지정한 상수 임계 앙각을 이용합니다.

  임계 앙각을 크게 하면 낮은 고도를 가진 위성은GPS 처리 결과에서 제외됩니다. 이들 위성 신호는 장애물이나 대류권을 통과하는 긴 경로로 인해 생기는 잡음의 영향을 받을 수 있습니다.

  임계 앙각을 너무 크게 하면 위성군 내에 이용 가능한 위성수가 적어져서 GPS 처리 결과에 영향을 미칠 수 있습니다.

위성 궤도력

위성궤도력 목록에서 기선 처리에 이용할 위성 궤도력의 종류를 선택합니다:

  방송력 − 이는 대부분의 처리에서 기본값 입니다. 방송력은 각 GPS 위성으로부터 정기적으로 전송되는데 보통 한시간 간격으로 전송됩니다. 위성 궤도력에는 위성의 궤도 매개변수가 포함됩니다.

  정밀력 − 이는 기선의 정확도를 더해줍니다. 정밀력은 종종 긴 기선 상에서 모호 정수 고정 해를 얻는데 도움이 됩니다. 이 옵션을 이용하기 위해서는 하나 이상의 정밀 위성 궤도력이 프로젝트내에 도입(파일 가져오기 수행) 되어 있어야 합니다.

기선 처리에서 정밀 위성 궤도력을 이용하려면, 프로젝트 내에 도입된 정밀 위성 궤도력 파일에 최소한 8개 이상의 위성 위치 집합이 데이터 처리 시간 간격 전 후로 있어야 합니다. 대부분의 정밀 위성 궤도력 파일은 위성 위치를 매 15분마다 제공하기 때문에 정밀 위성 궤도력 시간대를 측량 개시 두 시간 전과 두 시간 후로 해야 합니다. 만일 UTC 로 0:00 시 경에 측량을 한다면 적절한 카버를 위해 이틀 동안의 정밀 위성 궤도력 파일을 확보해야 할 경우도 있습니다.

과거에는 정밀 위성 궤도력 파일이 모든 GPS 위성에 대한 일주일 간의 정보를 가지고 있었습니다. 그러나 지금은 일반적으로 단 하루 동안의 정보 밖에 포함되어 있지 않습니다. 정밀 위성 궤도력 파일은 SP3과 EF18 포멧으로 얻어 지는데, Trimble Geomatics Office 소프트웨어는 둘 다 이용할 수 있습니다.

정밀 위성 궤도력 파일은 다음과 같은 곳에서 구할 수 있습니다:

  National Geodetic Survey (NGS)

  Center for Orbit Determination in Europe (CODE)

  European Space Agency (ESA)

  Scripps Institute Observatory (SIO)

  Canadian Department of Energy, Mines, and Resources (EMR)

  NASA's Jet Propulsion Laboratory (JPL)

  U.S. Naval Observatory (USNO)

해 유형

이 목록에서는 기선 처리기의 최종 통과를 위한 해 유형을 선택합니다.

기선 처리기는 이용 가능한 관측치 종류 및 활성 처리 스타일의 설정에 따라서 각 기선에 대해 정해진 해의 순차에 따라 처리를 진행합니다. 처리는 전형적으로 코드 해부터 시작되어 삼중차, 그리고 여러 개의 이중차 반송파 위상 해로 이어집니다. 여기서 최종 통과 해가 선택되는데, 이것이 주어진 관측치와 제어 하에서 얻을 수 있는 최적의 해가 됩니다.

가장 일반적인 해 유형은 짧은 기선에 대해서는 L1 고정  해, 대부분의 다른 기선에 대해서는 전리층 무영향 고정 해입니다. 아주 긴 기선을 처리할 경우에는, 전리층 무영향 유동 해가 최적의 해가 될 수 있습니다.

아래의 옵션들을 이용할 수 있습니다:

  코드 − 이 옵션은 코드 만의 해를 수행하기 위해서 이용합니다. 이 옵션을 선택하면, GPS 처리기는 코드 해 통과에서 종료합니다.

  유동 − 이 옵션은 고정 정수 모호성을 해결하지 않은 채 유동 해를 만들 때 이용합니다. 어떤 경우에는 처리 시간을 단축할 수 있는 잇점이 있습니다. 이옵션은 유동 해 밖에 얻을 수 없을 정도의 매우 긴 기선을 처리할 때 매우 유용할 수 있습니다. 해 유형으로 [유동]을 선택하면 GPS 처리기는 오랜 시간의 정수 검색을 수행할 필요가 없게 됩니다.

유동 해 생성을 위해 이용되는 기타 제어들은 다음과 같습니다:

 고정 해가 가능한 최대 기선 길이

  최대 정수 검색 시간

위의 두가지 제어는 고급 스타일 편집 대화상자에서 찾을 수 있습니다.

  고정 − 이 옵션은 고정 정수 해를 수행하기 위해서 이용합니다. 이것은 기본값일 뿐만 아니라 선호하는 해입니다.

참조: 코드 만의 최종 해 유형을 정하는 GPS 처리 스타일을 만들 때는, 질 탭에 있는 [수용 기준] 그룹도 편집해야 합니다. 코드 만의 해는 일반적으로 Trimble 기본값 처리 스타일에서 제공하는 기준에 의해서 플래그됩니다. 적절한 수용 기준을 가진 코드 만의 처리 스타일은 기선 처리 결과를 제대로 평가하게 해 줍니다.

고급

활성 GPS 처리 스타일에서 고급 제어를 보거나 편집하려면 고급을 누룹니다.


 [고급 스타일 편집] 대화상자  - [Static] 탭

추가 정보

 방법 ...

Static과 FastStatic 기선의 처리에 이용되는 설정을 변경하려면 이 제어를 편집합니다.

[고급 스타일 편집] 대화상자의 [Static] 탭을 보기위해서는:

1.  측량 / GPS 처리 스타일을 선택합니다.  GPS 처리 스타일 대화상자가 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면 스타일 편집 대화상자가 나타납니다.

4.  고급을 누릅니다. 고급 스타일 편집 대화상자가 나타납니다.

5.  [Static] 탭을 선택합니다.

기선 최소 관측 시간

기선의 처리에 앞서, 동시에 두 개 스테이션이 선점될 때 둘 사이에 필요한 최소 중복시간을 설정하려면 이 필드를 편집합니다. 이는 프로젝트에 잠재 기선의 추가를 정해 줍니다.

기본값으로 기선을 처리하는데 필요로 하는 수신기들 간의 최소 중복시간은 120초로 되어 있습니다. 이는 다중 로버 사이의 우연한 중복이 없도록 해 줍니다.

고정 해가 가능한 최대 기선 길이

기선 처리기가 고정해 산출을 하기 위해서 필요한 최대 기선 길이를 지정하려면 이 그룹의 필드를 편집합니다. 기선 길이가 지정한 값보다 길면 유동 해를 얻게됩니다.

다음의 필드들을 이용할 수 있습니다:

 방송 궤도력 이용시 − 방송 위성 궤도력을 이용하여 GPS 처리 고정 해를 계산할 때 최대 기선 길이를 정하기 위해서 이 필드를 편집합니다. 최대 기선 길이가 이 값보다 클 경우, GPS 처리기는 고정 해를 계산하지 않습니다. 기본값은 200 킬로미터입니다.

 정밀 궤도력 이용시 − 정밀 위성 궤도력을 이용하여 GPS 처리 고정 해를 계산할 때 최대 기선 길이를 정하기 위해서 이 필드를 편집합니다. 최대 기선 길이가 이 값보다 클 경우, GPS 처리기는 고정 해를 계산하지 않습니다. 기본값은 2000 킬로미터입니다.


 [고급 스타일 편집] 대화상자  - [Kinematic] 탭

추가 정보

방법 ...	기타
Kinematic 기선 처리에 이용되는 설정을 변경하려면이 제어들을 편집합니다.

[고급 스타일 편집] 대화상자의 [Kinematic] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면 스타일 편집 대화상자 나타납니다.

4.  고급을 누르면 고급 스타일 편집 대화상자 나타납니다.

5.  [Kinematic] 탭을 선택합니다.

최소 기준 관측 시간

하나의 선점이 처리 세션 내 다른 선점들의 기준 Kinematic 스테이션이 되기 위해 필요한 선점 최소 관측 시간을 정하려면 이 필드를 편집합니다.

다음의 지침을 참고하시기 바랍니다:

  이 필드 값은 여러 데이터 파일로부터 프로젝트에 도입된 공통 관측치의 중복 부분을 GPS 처리기가 처리하지 않도록 하기 위한 것입니다. 이 관측치들은 동시에 두개의 포인트를 선점하고 있는 두개 또는 그 이상의 로버에 의해서 수집됩니다. 만일 하나의 로버가 한 포인트에 설정된 최소 시간 이상 정지해 있으면, 그 로버는 기준 포인트로 취급되며 다른 로버에 의해서 수집된 공통 관측 데이터는 이 포인트와 연관되어 처리됩니다.

 단일 베이스 수신기와 두개의 이동 수신기를 갖춘 Kinematic 측량 을 고려해 보시기 바랍니다. 최소 기준 관측 시간을 정의하지 않을 경우, GPS 처리기는 로버와 베이스 사이의 데이터 뿐만 아니라 두 로버 사이의 데이터까지 처리하려고 할 것입니다.

  기본값은 600초입니다. 기본값인600초 또는 10분을 초과한 선점만이 기준점으로 간주된다는 것을 GPS 처리기에 알려줍니다.

  이동 수신기 사이의 기선을 처리하기를 원하면 이 필드를 0으로 설정합니다.

Static 초기화 최소 관측 시간

특정 Kinematic 처리 세그먼트에서 기선이 static 초기화로 이용되는 데 필요한 최소 관측 시간을 바꾸려면 이 필드를 편집합니다.

다음의 지침을 참고하시기 바랍니다:

  기선을 초기화를 위해 사용하기 전에 적어도 120초 (2분) 동안은 선점되도록 기본적으로 설정되어 있습니다.

  이 값을 초과하는 기선은 static 기선으로 처리되며, static 초기화를 위해 프로젝트에 저장됩니다.

알려진 측점 최소 초기화율

Kinematic GPS 처리 과정에서 알려진 측점 초기화에 이용되는 수용 가능 최소 비율을 바꾸려면 이 필드를 편집합니다.

알려진 측점 초기화는 두 개의 알려진 포인트 사이를 인버스(inverse) 함으로써 시작합니다. 이 인버스에서 얻어진 정보를 고정 기선처럼 간주합니다. 그런 다음 기선 처리기는 고정 인버스에서 얻은 기선을 보존했다가 위성 모호성만을 해결합니다. 이러한 단계는 정수 검색을 포함하는데, 이것은static 해 또는 FastStatic 해의 경우와 유사합니다.

검색의 성공 여부를 판정하는데 이용되는 비율은 일반 고정 정수 해의 경우와 같습니다. 만일 검색에서 얻어진 비율이 알려진 측점 초기화 최소 비율보다 크면, GPS 처리기는 그 결과를 수용하여 후속 Kinematic 처리를 위한 초기화에 이용합니다.

알려진 측점 최소 초기화율의 기본값은 3.0입니다. 이 값은 static해와 FastStatic 해를 위한 일반 차단 값인 1.5보다 높습니다. 이것은 처리기가 위성 모호성에 대한 해만을 제공하기 때문에 높은 것이며, 또한 관련된 변수가 더 적기 때문에 높게 됩니다.

최소 OTF 처리 시간

GPS 처리기가OTF 모호 정수를 해결하는데 필요한 최소 시간을 바꾸려면 이 필드를 편집합니다.

다음의 지침을 참고하시기 바랍니다.

  OTF 초기화를 처리하기 위해서는 수신기가 200초를 계속해서 작동해야 하며 최소한 네 개의 위성에 고정되어 있어야 합니다. 기본값은 200초와 보이는 위성 다섯 개입니다.

  Static 초기화 정보가 없는 경우, GPS 처리기는 최소 4개의 위성을 가지고 있는 위성군 데이터의 어느 부분을 이용하여 모호 정수를 해결하려고 시도합니다. 이 때 위성은 각각 지속 시간이 최소 200초인 에포크를 가지고 있어야 합니다. 위성군은 계속해서 바뀌기 때문에, 네 개 위성의 최적 조합을 가진 데이터가 처리되며, 네 개의 위성이 전체 선점을 통해 같은 위성일 필요는 없습니다.

  모든 static과 고정 기선 초기화를 수행한 후에도 모호성이 남아 있는 경우에 GPS 처리기는 OTF 초기화 기술을 이용합니다. 이 시간 간격보다 짧은 kinematic 처리 세그먼트 상에서는 OTF 초기화를 이용하지 않습니다. 이 세그먼트들은 static 또는 고정 기선 초기화 기술로 초기화를 해야합니다.


 [고급 스타일 편집]  대화상자 - [질] 탭

추가 정보

방법 ...	기타
처리 도중에, 또는 처리 결과를 프로젝트에 저장하기 전에, 신뢰도가 떨어지는 데이터와 해를 규명하고 이를 변경하고자 할 때 이 제어를 편집합니다. 이 페이지의 제어들은 기선 해의 합격, 플래그, 또는 수준미달 여부를 나타내는 데 이용됩니다.

 [고급 스타일 편집] 대화상자의 [질] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면, 스타일 편집 대화상자가 나타납니다.

4.  고급을 누르면, 고급 스타일 편집 대화상자가 나타납니다.

5.  [질] 탭을 선택합니다.

수용 기준

기선 처리 해에 합격, 플래그 또는 수준미달의 상태를 정하는 [수용 기준]을 변경하고자 할 때 이 그룹의 필드를 편집합니다. 이 기준은 처리 후 프로젝트에 어떤 기선 해를 저장할 것인가를 또한 결정합니다.

다음의 지침을 참고하시기 바랍니다:

  [플래그]와 [수준미달] 필드는RMS, 비율, 기준 분산 항에 모두 이용됩니다. 이들에 대한 정보를 원하시면 아래 항목을 참조하시기 바랍니다:

  If RMS 체크 상자

  If 비율 체크 상자

  If 기준 분산 체크 상자

  1주파 기선 해와 2주파 기선 해에 서로 별개의 기준을 지정할 수 있습니다. 1주파 또는 2주파 수용 기준은 이용 가능한GPS 측정치 종류, 활성 GPS 처리 스타일에서 선택한 해 유형, 그리고 기선 처리기에 의해 결정된 최종 해의 조합에 의해 결정됩니다.

  RMS, 비율, 기준 분산을 이용한 여러 선택 조합이 수용여부 검증의 근거가 될 수 있습니다. 합격/플래그/수준미달의 상태를 결정하기 위한 기본값은 이 세개의 질 매개변수 모두를 이용하는 것입니다. 복수의 질 요소를 함께 이용하면 가장 나쁜 조건을 기준으로 상태가 결정됩니다. 예를 들어, 비율과 기준 분산은 합격되었으나, RMS는 수준미달일 경우, 기선은 수준미달 상태를 수용합니다. 따라서 기본값은 세개를 모두 검증하는 것입니다.

참조: 대부분의 측량 프로그램의 경우 이 수용 기준을 수정할 필요가 없습니다. 다만, 코드만의 최종 통과 해는 예외입니다. 코드만의 해는 일반적으로 Trimble의 기본값 처리 스타일에서 제공하는 기준을 기초로 플래그됩니다. 코드만의 최종 통과 해를 처리하는 것이 일상적이라면 적절한 수용 기준을 설정하여 코드만의 처리 스타일을 정하는 것이 바람직 합니다.

승수 편집

연속 GPS 처리기 반복연산으로부터 이상값 을 제거하기 위한 차단값을 계산할 때 사용되는 승수를 변경하려면 이 필드를 편집합니다.

기선 처리기는 연속되는 일련의 반복연산을 통해서 기선의 해를 구합니다. 처리기는 각 반복 연산에서 해의 데이터 이상값을 플래그 하거나 제거합니다. 현재 해의 관측치 잔차를 에포크별로 계산합니다. 그런 다음 각 관측치 잔차를 차단값과 비교하여 관측치가 이상값인지 아닌지를 결정합니다.

차단값은 편집 승수를 곱한 모든 관측치 잔차에 대한 총괄 RMS입니다. 만일 이상값이 발견되면 다음번 처리기 반복연산에서 플래그 되어 제거됩니다. 모든 관측치 잔차의 새로운 총괄 RMS는 각 반복연산 별로 계산되며, 이 새로운 값은 추후 관측치의 플래그 및 제거에 이용되는 차단값의 기초로 이용됩니다.


    [If RMS] 체크상자

추가 정보

 대화상자

이 체크 상자는 기선처리 해의 수용 여부를 결정할 때 RMS의 이용을 제어합니다.

RMS는 측정치의 잡음 수치이며 RMS 값이 작을수록 양호한 것으로 간주됩니다. RMS 값이 플래그 값보다 작으면 합격 상태입니다. RMS 값이 플래그 값보다 크지만 수준미달 값보다 작으면 플래그 상태가 됩니다. RMS 값이 수준미달 값보다 크면 기선은 수준미달 상태가 됩니다. 만일 이 체크 상자가 비어 있으면 수용 여부를 결정할 때 RMS는 무시됩니다.

RMS 검증에는 두 쌍의 필드가 포함되는데, 하나는 1 주파 플래그 및 수준미달 필드이고 다른 하나는 2 주파 플래그 및 수준미달 필드입니다. GPS 처리기는 RMS 수용 검증을 수행할 때 이들 중 한쌍의 필드에 있는 값만을 이용합니다. 이용할 필드는 GPS 처리 스타일 설정에서 정한 해 유형에 의해 결정됩니다.

수용 상태는 RMS, 비율, 기준 분산의 체크상자 조합에 따라 결정됩니다. 합격/플래그/수준미달의 상태를 결정하기 위한 기본값은 세 개의 질 매개변수 모두를 선택하는 것입니다. 복수의 질 요소를 함께 이용하면 가장 나쁜 조건을 기준으로 상태가 결정됩니다. 예를 들어, 비율과 기준 분산은 합격이나, RMS가 수준미달일 경우에, 기선은 수준미달 상태가 됩니다.


 [If 기준 분산] 체크상자

추가 정보

대화상자	기타
이 체크 상자는 기선 처리 해의 수용 여부를 결정할 때 기준 분산의 이용을 제어합니다.

기준 분산은 기선 처리기가 오차를 얼마나 잘 추정하는가에 대한 측정치입니다. 이상적인 기준 분산은 1.0 입니다. 값이 1.0 보다 작으면 발생한 오차가 예상보다 적다는 것을 의미합니다. 값이 1.0 보다 크면 발생한 오차가 예상보다 크다는 것을 의미합니다. 기준 분산에 근거한 수용 검증은 오차가 예상보다 큰 경우인 두번째 경우만을 탐색합니다.

기준 분산 값이 플래그 값보다 작으면 합격 상태가 됩니다. 기준 분산 값이 플래그 값보다 크지만 수준미달 값보다 작으면 플래그 상태가 됩니다. 기준 분산 값이 수준미달 값보다 크면 그 기선은 수준미달 상태가 됩니다. 만일 체크 상자가 비어 있으면, 수용을 결정하는데 기준 분산은 고려되지 않습니다.

기준 분산 검증에는 두 쌍의 필드가 포함되는데, 하나는 1 주파 플래그 및 수준미달 필드이고 다른 하나는 2 주파 플래그 및 수준미달 필드입니다. GPS 처리기는 검증을 수행할 때 이들 중 한쌍의 필드에 있는 값만을 이용합니다. 이용할 필드는 GPS 처리 스타일 설정에서 정한 해 유형에 의해 결정됩니다.

수용 상태는 RMS, 비율, 기준 분산의 체크 상자 조합에 따라 결정됩니다. 합격/플래그/수준미달의 상태를 결정하기 위한 기본값은 세개의 질 매개변수 모두를 이용하는 것입니다. 만일 복수의 질 요소가 함께 이용되면, 가장 나쁜 조건을 기초로 상태가 결정됩니다. 예를 들어, 비율과 기준 분산은 합격이나, RMS가 수준미달일 경우에 기선은 수준미달 상태가 됩니다.


    [If 비율] 체크상자

추가 정보

대화상자	기타
이 체크 상자는 기선 처리 해의 수용 여부를 결정할 때 비율의 이용을 제어합니다.

비율은 기선 처리기가 고정 정수 해를 얼마나 잘 정하느냐에 대한 측정치인데 숫자가 클수록 양호한 것으로 간주됩니다. 비율 값이 플래그 값보다 크면 합격 상태가 됩니다. 값이 플래그 값보다 작지만 수준미달 값보다 크면 플래그 상태가 됩니다. 값이 수준미달 값보다 작으면 기선은 수준미달 상태가 됩니다. 만일 이 체크 상자가 비어 있으면 수용을 결정할 때 비율은 고려되지 않습니다. 처리 유형의 최종 해가 유동 또는 코드인 경우에도 비율은 무시됩니다.

비율 검증에는 두 쌍의 필드가 포함되는데, 하나는 1 주파 플래그 및 수준미달 필드이고 다른 하나는 2 주파 플래그 및 수준미달 필드입니다. GPS 처리기는 비율 검증을 수행할 때 이들 중 한쌍의 필드에 있는 값만을 이용합니다. 이용할 필드는 GPS 처리 스타일을 위해 선택된  해 유형에 의해 결정됩니다. 이용할 필드는 GPS 처리 스타일 설정에서 정한 해 유형에 의해 결정됩니다.

수용상태는 RMS, 비율, 기준 분산 의 체크상자 조합에 따라 결정됩니다. 합격/플래그/수준미달의 상태를 결정하기 위한 기본값은 세개의 질 매개변수 모두를 이용하는 것입니다. 만일 복수의 질 요소가 함께 이용되면, 가장 나쁜 조건을 기초로 상태가 결정됩니다. 예를 들어, 비율과 기준 분산은 합격이나, RMS가 수준미달일 경우에 기선은 수준미달 상태가 됩니다.


   [고급 스타일 편집] 대화상자 - [대류권] 탭

추가 정보

방법 ...	기타
기선 처리 과정에서 대류권 모델의 선택이나 적용을 변경하고자 할 때 이 제어를 편집합니다.

[고급 스타일 편집] 대화상자의 [대류권] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면, 스타일 편집 대화상자가 나타납니다.

4.  고급을 누르면, 고급 스타일 편집 대화상자가 나타납니다.

5.  [대류권] 탭을 선택합니다.

모델

이 목록에서 대류권 보정 모델을 선택합니다. 이 모델은 신호가 대류권을 통과할 때 도입된 오차를 보상합니다. 보정량은 위성 고도에 따라 다양합니다.

아래의 옵션들을 이용할 수 있습니다:

  Hopfield − Hopfield 모델이 기본값입니다.

  Goad-Goodman

  Saastamoinen

  검정 − 검정 모델은 낮은 위성 앙각에서는 불안정하며 10도 이하의 임계 앙각에서는 사용해서는 안됩니다.

  Niell − Niell 모델은 위성 고도, 위도, 계절에 영향을 많이 받습니다.

  없음 − 대류권 모델을 이용하지 않으려면 이 옵션을 선택합니다.

대류권을 통과하는 GPS 신호를 보정하기 위한 모델에 대해 추가 정보가 필요하면, 참고문헌을 참조하시기 바랍니다.

추정 천정 지연 간격

상수의 추정 천정 지연 간격을 시간 단위로 정의하려면 이필드를 편집합니다.

다음의 지침을 참고하시기 바랍니다:

  시간 수는 정수 값으로 입력해야 합니다. 바람직한 최소 추정 간격은 1시간입니다. 기본 값은 2시간입니다. 값이 0이면 천정 지연 추정이 행해지지 않습니다. 대류권 모델이 '없음'으로 설정되어 있는 경우에 이 필드는 이용할 수 없습니다.

  대류권은 전리층 만큼 동적이지 않기 때문에 2시간의 신호 지연은 완만한 편입니다. 긴 기선을 처리할 경우 폭풍전선이 두 수신기 중 한 개의 위를 통과하게 되면, 추정 간격을 짧게 해야합니다. 기본값 간격은 2시간입니다.

  기선이 50 킬로미터 이상 길 경우, 방송 위성 궤도력의 오차로 인해 대류권 매개변수 추정이 부정확할 수도 있습니다. 이런 경우에는 정밀 위성 궤도력을 이용합니다.

  기선이 대략 10 킬로미터 이하이고, 지속 시간 2시간 이하의 데이터 파일인 경우에는 천정 지연을 추정하는 것은 실익이 없습니다. 기선 길이와 관측 시간이 길어질수록 대류권의 영향은 더욱 커지게 됩니다.

기상 관측 데이터 이용

GPS 처리 해를 계산할 때 현장에서 수집한 기상 데이터를 사용하도록 지정하려면 이 체크 상자를 선택합니다. 기상 데이터는 기온, 기압 그리고 상대 습도로 구성됩니다.

다음의 지침을 참고하시기 바랍니다:

  이 체크 상자를 선택하면, 대류권 천정 지연을 계산할 때 GPS 데이터 파일(.dat)의 기상 관측 데이터, 또는 RINEX 파일로 도입된 기상 관측 데이터를 사용하여 대류권 모델을 정합니다. 기본값으로 이 체크 상자가 선택됩니다.

  기록된 기상 데이터 대신 표준 기상 값을 이용하려면 이옵션 선택을 해제합니다.

참조: 현장에서 기상 데이터를 기록할 때는 제대로 읽을 수 있도록 눈금이 있는 고 품질의 기기를 사용하는 것이 중요합니다. 눈금이 정해져 있지 않거나 저 품질의 기기에서 얻어진 기상 데이터는 기선 해의 정밀도를 떨어뜨릴 수 있습니다.


  [고급 스타일 편집] 대화상자 - [전리층] 탭

추가 정보

방법 ...	기타
기선을 처리할 때 전리층 모델 적용을 변경하기 위해서 이 제어를 편집합니다.

[고급 스타일 편집] 대화상자의 [전리층] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면 스타일 편집 대화상자가 나타납니다.

4.  고급을 누르면 고급 스타일 편집 대화상자가 나타납니다.

5.  [전리층] 탭을 선택합니다.

모호 정수 결정 통과

모호 정수 결정 통과를 위한 전리층 모델 설정을 하려면 이 그룹에 있는 체크 상자를 선택합니다. [다음 보다 긴 기선 모두에 적용]에 입력된 값이 전리층 보정 수신을 위한 최소 기선 길이를 결정합니다.

2 주파 수신기로 관측된 10 킬로미터 이상의 기선에 대해서는 [전리층 무영향]이 보정 기본값입니다. 1 주파 수신기로 관측된 기선에 대해서는 방송력 전리층 모델이 이용됩니다. 이 옵션은 모호 정수 결정 때에만 전리층 보정 이용을 제어합니다. 최종 통과 전리층 보정을 위해서는 별도의 제어를 이용해야 합니다.

최종 통과

최종 통과를 위한 전리층 모델 설정을 하려면 이 그룹에 있는 체크 상자를 선택합니다. [다음 보다 긴 기선 모두에 적용]에 입력된 값이 수신 전리층 보정을 위한 최소 기선 길이를 결정합니다.

2 주파 수신기로 관측된 5 킬로미터 이상의 기선에 대해서는 [전리층 무영향]이 보정 기본값입니다. 1 주파 수신기로 관측된 기선에 대해서는 방송력 전리층 모델이 이용됩니다. 이 옵션은 최종 통과 때에만 전리층 보정 이용을 제어합니다. 모호성 통과 전리층 보정을 위해서는 별도의 제어를 이용해야 합니다.


  [고급 스타일 편집] 대화상자 - [이벤트] 탭

추가정보

방법 ...	기타
이벤트 위치와 시간을 계산하는데 이용되는 보간법 구성과 시간 옵셋을 정의하기 위해서 이 제어를 편집합니다.

[고급 스타일 편집] 대화상자의 [이벤트] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면 스타일 편집  대화상자가 나타납니다.

4.  고급을 누르면 고급 스타일 편집 대화상자가 나타납니다.

5.  [이벤트] 탭을 선택합니다.

수신기가 이벤트를 기록할 때에, GPS 측정치와 함께 이벤트 표시자가 파일 내에 위치하게 됩니다. 이 이벤트 표시자는 그 이벤트가 발생한 시간을 표시하는 시간 테그(tag)를 가지고 있습니다. 이벤트는 데이터 측정치가 만들어지는 순간에 발생하는 일이 드물기 때문에 GPS 처리기는 먼저 이벤트 전 후의 수신기 위치를 계산하고, 나중에 그 이벤트가 발생한 위치를 보간해야 합니다.

보간법

연속 키네매틱 데이터를 처리할 때 이벤트 위치 도출을 위해서 선형 보간법과 2차 함수형 보간법 중 택일하여야 하며, 이를 위해서 다음 옵션 중 하나를 선택합니다:

  선형 − 이벤트가 발생한 전 후의 기선 해의 위치를 이용한 단순 선형 보간법을 적용하려면 이 옵션을 선택합니다. 최소 2개의 포인트가 필요하며 선형 보간법에는 5개 포인트까지 이용 가능합니다. 적용 포인트 갯수 필드에는 이용할 포인트의 수를 지정합니다. 기본값은 2개 포인트입니다.

  2차함수형 − 이벤트가 발생한 전 후의 기선 해의 위치를 이용하여 이차 함수 곡선 보간법을 적용하려면 이 옵션을 선택합니다. 최소 3개의 포인트가 필요하며 이차 함수 보간법에는 5개 포인트까지 이용 가능합니다. [적용 포인트 갯수] 필드에는 이용할 포인트의 수를 지정합니다. 기본값은 3개 포인트입니다.

보간법과 최종 시간 테그는 다음의 옵션에 의해 제어됩니다:

적용 포인트 갯수

이벤트의 위치를 보간하는데 이용할 포인트 수를 지정하기 위해서 이 필드를 편집합니다.

이 값은 선형과 이차함수 보간법 모두에 적용되는 포인트 수를 제어하는데에 이용됩니다. 선형 보간을 위한 기본값은 2 포인트이고, 이차함수 보간을 위한 기본값은 3 포인트입니다. 만일 포인트 수가 부족하면 보간은 일어나지 않습니다.

유실 에포크의 최대 허용 갯수

이벤트의 위치를 계산할 때 유실 데이터 측정치 에포크의 최대 허용 갯수를 제어하기 위해서 이 필드를 편집합니다.

다음의 지침을 참고하시기 바랍니다:

  이 필드에 입력된 값은 이벤트 위치 보간법을 위한 시발값 또는 차단값으로 이용됩니다. 만일 유실 데이터 측정치 에포크 수치가 이 값을 초과하면, 기선 처리기는 이벤트 위치 보간을 시도하지 않습니다. 기본값은 0입니다. 이벤트 시각의 직전과 직후에 각각 적어도 한 개의 데이터 측정치가 필요합니다.

  이 값을 증가시키면 데이터 유실로 인해서 보간 위치를 수신하지 못한 이벤트를 복구하는데 도움이 될 수 있습니다. GPS 측정치가 1.0초 비율로 수집되는 연속 키네매틱 측량을 예로 들면, 이벤트는 245742.2 초의 시간 테그로 시작합니다. 유실 에포크의 최대 허용 갯수가 0이면, 이벤트 위치를 보간하기 위해서 245742.0와 245743.0의 시간대에 있는 연속 키네매틱 해가 이용 가능 해야 합니다. 만일 시간대 245743.0의 연속 키네매틱 벡터가 유실되면, 이벤트 위치는 보간되지 않습니다. 245744.0 시간대의 벡터가 이용 가능할 경우에는 유실 에포크의 최대 허용 값을 1로 늘림으로써 이벤트 위치를 계산할 수 있습니다.

참조: 이 값을 과도하게 늘리면 위치 보간의 정확도가 떨어집니다.

시간 옵셋

수신기에 기록된 이벤트 시간과 실제로 이벤트가 발생한 시간 사이에 상수 시간 옵셋을 적용하기 위해서 이 필드를 편집합니다.

다음 지침을 참고하시기 바랍니다:

  시간 옵셋은 마이크로초(100만분의 1초) 단위로 입력하며 양수 또는 음수가 됩니다. 양수값은 시간 테그에 지정한 마이크로초 만큼 씩 증가시킴으로서 이벤트 시간을 늦춥니다. 음수값은 그 반대의 효과를 가져옵니다.

  이 값은 기본값인 0으로 설정되어 있습니다. 외부 기기가 GPS 수신기에 연결되어 있고 보고된 이벤트 시간과 실제 이벤트 발생 시간 사이에 시간 옵셋이 존재하는 경우에는 이 값을 변경합니다. 지리적 지형을 촬영할 때 셔터가 작동하는 공중 카메라를 생각해 보시기 바랍니다. 카메라는 셔터가 작동할 때 이벤트를 수신기에 보고하므로 당시의 셔터 속도에 따라서 시간 옵셋이 발생하게 됩니다. 만일 셔터 속도가 1000 분의1초로 설정되어 있다면, 사진은 보고된 이벤트가 발생한 1000분의 1초 후에 찍히게 될 것입니다. 이 필드는 이와 같은 성질의 시간 옵셋을 보정할 수 있도록 해줍니다.


  [고급 스타일 편집] 대화상자 - [OTF 검색] 탭

추가 정보

방법 ...	기타
모호 정수 결정 통과 과정에서 OTF 검색 수행 방법을 결정하는 변수를 정의하기 위해서 이 제어를 편집합니다.

[고급 스타일 편집] 대화상자의 [OTF 검색] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  스타일 목록에서 스타일을 선택합니다.

3.  편집을 누르면 스타일 편집  대화상자가 나타납니다.

4.  고급을 누르면 고급 스타일 편집 대화상자가 나타납니다.

5.  [OTF 검색 탭]을 선택합니다.

검색법

OTF 키네매틱 처리 과정에서 이용되는 모호성 검색 방법을 제어하기 위해서 다음 그룹 중 한 옵션을 선택합니다:

  최적 검색 − 초기 GPS 처리 통과 과정에서 추정된 모든 모호성의 유동 값을 이용하기 위해서 이 옵션을 선택합니다. 모든 추정치가 계산되고 나면, 유동 모호성이 검색되고 가능한 경우 정수값으로 고정됩니다. 이것이 기본값이며 데이터를 가장 철저히 검색하게 해줍니다.

  전방 순차 검색 − 데이터를 처리할 때 전방 순차 검색을 이용하기 위해서 이 옵션을 선택합니다. 데이터는 시간 상 가장 오래 전에 기록된 데이터에서 시작해서 가장 최근에 기록된 데이터를 끝으로 전방으로 검색합니다. 데이터가 순차적으로 검색되기 때문에 모호성 검색은 필요한 때(예를 들면, 싸이클 슬립이 탐지되는 경우)에 일어납니다. 전방 검색은 최적 검색보다 시간이 적게 걸립니다.

  후방 순차 검색 − 데이터를 처리할 때 후방 순차 검색을 이용하기 위해서 이 옵션을 선택합니다. 데이터는 시간 상 가장 최근에 기록된 데이터에서 시작해서 가장 오래 전에 기록된 데이터를 끝으로 후방으로 검색합니다. 데이터가 순차적으로 검색되기 때문에 모호성 검색은 필요한 때(예를 들면, 싸이클 슬립이 탐지되는 경우)에 일어납니다. 후방 검색은 최적 검색보다 시간이 적게 걸립니다.

참조: [순차 제어] 옵션에서 검색한 데이터를 기각하는 방법을 결정합니다.

순차 제어

[최소 검색률] 필드는 검색법 그룹의 선택 옵션에 따라 [이용] 상태가 되기도 하고 [불이용] 상태가 되기도 합니다. OTF 검색 과정에서 조사한 데이터의 불합격 여부를 결정하는 데 사용되는 기각 기준을 정의하기 위해서 이 필드를 이용합니다.

모호 정수 결정 통과 중에 조사 데이터의 검색을 기각하는데 이용된 비율을 편집할 수 있습니다. 검색 비율이 이필드에 입력된 값보다 작으면 직후의 검색이 기각되며 검색에 대한 모호성은 다른 모든 데이터가 조사될 때까지 고정되지 않습니다.


    [GPS 처리 스타일] 대화상자 - 개요

추가정보

방법 ...	대화상자
개요

활성 GPS 처리 스타일을 선택, 열람, 편집, 작성, 복사, 이름변경, 그리고 삭제하고자 할 때 이 대화상자를 이용합니다. 이 대화상자를 열려면:

  측량 / GPS 처리 스타일을 선택합니다. [GPS 처리 스타일] 대화상자가 나타납니다.

아래의 제어들을 이용할 수 있습니다:

스타일 목록

이 목록에서 하나의 스타일을 선택하면 그것이 [활성 스타일]이 됩니다. 편집, 복사, 이름변경 또는 삭제하기 전에 특정 GPS 처리 스타일을 먼저 활성 스타일로 만들어야 합니다. 이 대화상자를 닫게 되면 최근 활성 스타일 내용이 기억되어 다음 번 GPS 처리 세션에서 그대로 사용됩니다.

편집

활성 스타일을 보거나 편집하려면 이 단추를 누릅니다.

새로 만들기

이 단추를 누르면 새 스타일 대화상자가 나타납니다. 그리고 Trimble Geomatics Office 소프트웨어의 기본 스타일 설정이 이용됩니다. (Trimble의 기본값 스타일을 삭제하기 전 에 반드시 사용자의 GPS 처리 스타일을 설정해야 합니다.)

복사

활성 스타일을 복사하고자 할 때 이 단추를 누릅니다.  스타일 복사 대화상자가 나타납니다.

이름변경

활성 스타일의 이름을 변경하고자 할 때 이 단추를 누릅니다. 스타일 이름변경 대화상자가 나타납니다.

삭제

활성 스타일을 삭제하고자 할 때 이 단추를 누릅니다.


    [새 스타일]  대화상자

추가 정보

방법 ...	방법 ...

새로운 GPS 처리 스타일을 만들려면 이 대화상자를 이용합니다.

[새 스타일] 대화상자를 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  새로 만들기를 누르면 [새 스타일] 대화상자가 나타납니다.

이름

새 스타일에 이름을 부여하기 위해서 이 필드를 이용합니다. 스타일 이름에는 255자까지 사용할 수 있으나 이름이 짧을수록 스타일 목록에서 찾기가 쉽습니다.

참조: 이 대화상자를 종료하기 위해서 확인을 누르면 대화상자 제목에 새 스타일 이름을 가진 스타일 편집 대화상자가  나타납니다. 이 대화상자에서 일반 스타일 설정을 할 수 있으며, 거기에서 고급을 누르면 좀더 고급 설정을 할 수 있습니다.


    [스타일 이름변경] 대화상자

추가 정보

GPS 처리 스타일의 이름을 변경하기 위해서 이 대화상자를 이용합니다:

[스타일 이름 변경] 대화상자를 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  목록에서 원하는 스타일을 선택합니다. 그 스타일 이름이 하이라이트됩니다.

3.  이름변경을 누르면 [스타일 이름변경] 대화상자가 나타납니다.

이름

이 필드에는 변경된 새 스타일의 이름을 입력합니다. 스타일 이름에는 255자까지 사용할 수 있으나 이름이 짧을수록 스타일 목록에서 찾기가 쉽습니다.


   [스타일 복사] 대화상자

추가 정보

 방법 ...

새 스타일의 모체로 사용할 활성 GPS 처리 스타일을 복사하고자 할 때 이 대화상자를 이용합니다.

[스타일 복사] 대화상자를 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다. GPS 처리 스타일 대화상자가 나타납니다.

2.  목록에서 복사할 스타일을 선택합니다.

3.  복사를 누르면 [스타일 복사] 대화상자가 나타납니다.

이름

복사된 새 스타일의 이름을 입력하기 위해서 이 필드를 이용합니다. 스타일 이름에는 255자까지 사용할 수 있으나 이름이 짧을수록 스타일 목록에서 찾아 읽기가 쉽습니다.

참조: 이 대화상자를 종료하기 위해서 확인을 누르면 대화상자 제목에 복사된 새 스타일 이름을 가진 스타일 편집 대화상자가  나타납니다. 이 대화상자에서 일반 스타일 설정을 편집할 수 있으며, 고급을 누르면 좀더 고급 설정을 편집할 수 있습니다.


   [고급 스타일 편집] 대화상자 - [글로벌] 탭

추가 정보

방법 ...	대화상자	기타
스태틱과 키네매틱 처리에 공통으로 적용되는 설정을 변경하고자 하면 이 제어를 편집합니다.

[고급 스타일 편집] 대화상자의 [글로벌] 탭을 보려면:

1.  측량 / GPS 처리 스타일을 선택합니다.  GPS 처리 스타일 대화상자가 나타납니다.

2.  목록에서 스타일을 선택합니다.

3.  편집을누르면 스타일 편집 대화상자가 나타납니다.

4.  고급을누르면 고급 스타일 편집  대화상자 나타납니다.

5.  [글로벌] 탭을 선택합니다.

주파수 종류

최종 GPS 처리 통과 과정에서 이용되는 주파수 종류를 아래 목록에서 선택합니다:

  L1 − L1 반송파 주파수를 선택하기 위해서 이 옵션을 이용합니다. L1이 기본값입니다.

  L2 − L2 반송파 주파수를 선택하기 위해서 이 옵션을 이용합니다.

  광역 − L1반송파 파장에서 L2반송파 파장을 차감하여 (L1 � L2) 구한 약 86센티미터 길이의 파장을 가진 광역 관측량을 선택하기 위해서 이 옵션을 이용합니다.

  협역 − L1반송파 파장과 L2 반송파 파장을 합산하여 (L1 + L2) 구한 약 11센티미터 길이의 파장을 가진 협역 관측량을 선택하기 위해서 이 옵션을 이용합니다.

다음의 지침을 참고하시기 바랍니다:

  [전리층] 탭에서 [최종 통과] 제어를 선택하면, 여기서 지정한 주파수 종류는 전리층 최종 통과를 위한 차단값보다 짧은 기선에만 적용됩니다. 전리층 최종 통과를 위한 차단값보다 긴 기선은 전리층 무영향 해를 얻게 됩니다.

  만일 프로젝트 데이터가 1 주파 수신기의 관측치를 포함하고 있는 경우에는 L2, 광역, 협역의 옵션은 적용되지 않습니다. L2, 광역, 협역 옵션을 이용하려면 모든 데이터가 2 주파 수신기로 수집되어야 합니다.

조정 가능한 최대 싸이클 슬립

기선 처리 과정에서 처리기에 의해 조정 가능한 싸이클 슬립의 최장 시간을 설정하기 위해서 이 필드를 편집합니다.

아래의 지침을 참고하시기 바랍니다:

  GPS 처리기는 설정한 시간, 또는 그 이하 시간의 싸이클 슬립 만을 조정합니다.

  GPS 처리기는 지정된 시간 이상의 싸이클 슬립은 조정하지 않습니다. 대신, GPS 처리기는 싸이클 슬립의 각 면에 대한 별도의 모호성을 추정합니다.

참조: Timeline을 이용하여 개별 위성의 추적을 통해 GPS 측정치의 싸이클 슬립을 육안으로 확인할 수 있습니다. 싸이클 슬립은 Timeline의 L1 또는 L2 반송파 스팬 그래픽에서 연결 중단으로 표시됩니다. 추가 정보를 원하면 Timeline을 참조하시기 바랍니다.

최대 반복 연산수

기선 처리기가 기선 해를 계산할 때 이용하는 최대 반복 연산 횟수를 설정하기 위해서 이 필드를 편집합니다. 입력 가능한 값은1에서 99까지입니다.

다음의 지침을 참고하시기 바랍니다:

  하나의 기선을 결정하는 데 하나의 해 당 평균 3회의 GPS 처리 반복연산을 수행합니다. 만일 10회의 반복연산이 필요하다면, 이 기선 처리 해는 문제가 있는 것입니다.

  일반적으로 10회 반복이면 충분합니다. 최소 자승법 조정.에 미치는 영향을 이해하기 전에는 이 필드를 변경하지 마시기 바랍니다.

최대 정수 검색 시간

기선 처리기가 정수 검색에 소비하는 시간을 제한하기 위해서 이 필드를 편집합니다. 이 제어는 긴 기선 처리, 특히 24시간 이상의 긴 시간에 걸쳐 수집한 데이터를 이용하는 경우에 주로 이용됩니다.

다음의 지침을 참고하시기 바랍니다:

  잘못된 기준 스테이션 좌표와 같은 일정 조건 하에서는 GPS 처리기가 글자 그대로 수십억의 조합을 검색하게 되므로 계산에 수 시간이 소요될 수 있습니다. 따라서 이 시간 제한이 필요하며, 지정된 시간이 지나면 해를 완성하지 않고 검색을 정지한 후 유동 해로 진행 합니다.

  기본값은 30분입니다.


    [GPS 처리] 대화상자

추가 정보

방법 ...	기타
[GPS 처리] 대화상자는 아래 사항을 보여줍니다:

  처리 상태

  처리된 기선수

  수용된 기선과 기각된 기선의 수

[GPS 처리] 대화상자를 열려면:

1.  처리할 기선들을 선택합니다. 해당 기선들이 그래픽 창에서 하이라이트 됩니다.

2.  기선 처리를 시작하려면 다음 중 하나를 행합니다:

  [측량] 메뉴에서 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄의 Trimble Survey그룹에서 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄의 [처리] 그룹에서 [GPS 기선 처리]를 선택합니다.

  F9을 누릅니다.

[GPS 처리] 대화상자가 나타나면서 기선 처리가 시작됩니다.

아래의 제어를 이용할 수 있습니다:

GPS 처리 목록

GPS 처리 결과를 보려면 이 목록을 살펴봅니다.

GPS 처리 상태 표시기

상태 표시줄 맨 왼쪽에 있는 진행 표시기는 각 기선 처리의 진행 상태를 보여줍니다. 이 표시기를 누르면 [GPS 처리] 대화상자가 중앙으로 이동합니다.

두 번 째 표시기는 GPS 처리기에 의해 생성된 메시지를 보여 줍니다. 작업이 진행되면서 각 기선의 시작 포인트와 끝 포인트가 표시됩니다.

오른 쪽에서 세 번 째 상태 표시기에는 이미 처리한 기선들의 수와 앞으로 처리할 기선들의 수가 나타납니다. 이 표시기는 모든 기선들이 처리된 후 그 해들을 프로젝트에 저장하기 위해 저장을 클릭하지 않는 한 [미저장] 이라고 표시합니다.

오른 쪽 끝의 상태 표시기는 수용된 기선 해와 기각된 기선 해의 수를 보여줍니다.

처리 세션이 완료되었을 때 상태 표시줄에는 기선이 처리되었으나 아직 프로젝트에 저장되지 않았음을 알리는 [미저장] 표시가 나타납니다. 각각의 기선 처리가 완료 됨에 따라 한줄로 된 기선처리 요약이 테이블 형식으로 출력됩니다.

멈춤 / 저장

처리가 완료되기 전에 멈춤을 클릭함으로써 기선 처리 세션을 취소하지 않고 정지시킬 수 있습니다. 처리가 완료된 후에는 멈춤 단추가 저장 단추로 바뀝니다. GPS처리 목록에서 선택한 해를 프로젝트에 저장하고자 할 경우에는 저장을 선택합니다. 선택된 기선 해는 [사용] 표시 난에 있는 선택 표시로 식별됩니다. 저장은 아래의 설명처럼 중복 기선 해 덮어 쓰기 선택 표시에 의해서도 영향 받을 수 있습니다

취소

GPS 처리 세션이 시작된 후 이를 취소하고자 할 경우에는 어느 때든지 취소 단추를 선택합니다. 다음 사항을 참고하시기 바랍니다:

  만약 이 단추를 클릭했을 때 GPS 처리가 이미 완료되었을 경우에는 확인을 요청하는 메시지가 나타납니다. 예를 클릭하면 이미 처리된 해는 삭제되면서 대화 상자가 닫힙니다. 아니오를 클릭하면 [GPS 처리] 대화 상자로 돌아갑니다.

  만약 이 단추를 클릭했을 때 GPS 처리가 진행 중일 경우에는 현재의 기선 해는 완료되면서 처리가 정지되고 확인 메시지가 나타납니다. 예를 누르면 이미 처리된 해는 삭제되면서 대화 상자가 닫힙니다. 아니오를 누르면 [GPS 처리] 대화 상자로 돌아갑니다.

보고서

선택된 기선 해의 GPS 기선 처리 보고서를 보고자 할 경우에 이 단추를 선택합니다. 이 단추를 사용하려면 반드시 GPS 처리 목록으로부터 기선 해를 하이라이트하여 먼저 선택하여야 합니다.

[GPS 기선처리 보고서] 대화상자가 나타나면 정보를 살펴보기 위해서 보고서를 탐색할 수 있습니다. 이 보고서를 보기 위해서 모든 기선 처리가 완료될 때까지 기다릴 필요는 없습니다. GPS 처리 목록에 첫번째 해가 테이블에 나타나는 즉시 그 보고서를 볼 수 있습니다.

중복 기선 해 덮어쓰기

기선을 재처리한 후 저장하는 방법을 제어하기 위해 이 옵션을 사용합니다. 이 난은 기본 설정으로 체크되어 있어 기존의 해를 덮어 쓰도록 하고 있습니다. 만약 이 난의 체크 표시를 해제하면 프로젝트에 새로운 해가 추가되면서 전에 있던 해는 계속 보존됩니다. 이와 같은 경우에는 새로운 해가 활성 해가 되며 기존의 해는 비활성 해가 됩니다. 등록 정보 창을 이용하여 기존의 해를 활성 해로 되돌릴 수 있습니다.

[중복 기선 해 덮어 쓰기] 옵션은 두 번 이상 처리된 기선에 만 적용됩니다. 그러나 서로 다른 시각 또는 서로 다른 날짜에 수집된 GPS 데이터에서 계산된 동일한 두 포인트 사이의 기선에는 적용되지 않습니다. Trimble은 항상 [중복 기선 해 덮어 쓰기]를 권장합니다.


    GPS 처리 목록

추가 정보

대화상자	기타
GPS 처리 목록은 한 줄로된 기선 해 요약을 테이블 형식으로 보여줍니다. 각 기선 처리가 완료 됨에 따라 한 줄씩 목록에 추가됩니다. 기선 요약이 출력되는 순서는 열의 제목을 클릭해서 제어할 수 있습니다. 열의 제목 중 하나를 마우스로 누르면 해당 열의 내용이 기록된 값에 따라 순서대로 정렬됩니다. 이 정렬 기능은 매우 편리한 기능입니다. 낮은 비율, 높은 RMS 또는 높은 기준 분산을 가진 기선들을 한 눈으로 신속히 일별해 볼 수 있습니다.

[GPS 처리 목록]은 아래와 같은 열을 가지고 있습니다:

사용

이 체크 상자에는 기선 해가 처리되어 수용 기준에 따라 그 결과가 합격 또는 플래그일 경우에만 체크 표시가 나타납니다. 만일 비율, 기준 분산, RMS 등의 수용 기준에 따라 그 결과가 수준미달인 경우에는 이 체크 상자의 체크 표시가 해제됩니다. 저장 단추가 사용될 경우, [사용] 체크 상자에 체크 표시가 되어 있는 선택된 기선 해만 프로젝트에 저장됩니다.

기선 ID

프로젝트에서 해당 기선에 주어진 관측치의 확인자를 의미합니다.

시작 스테이션

기선이 시작된 포인트를 의미합니다.

끝 스테이션

기선이 끝나는 포인트를 의미합니다. 이 포인트의 좌표는 시작 스테이션의 좌표에 기선 구성요소를 더해서 구합니다.

기선 길이

기선의 사거리를 의미합니다.

해 유형

처리기에 의해 결정된 최종 기선 해 유형을 의미합니다.  대부분의 경우, 해 유형은 L1 고정, L1 유동, 전리층 무영향 고정, 또는 전리층 무영향 유동 입니다.

비율

비율은 차선 기선 해의 분산과 최적 기선 해의 분산 간의 관계를 평가하는데 이용됩니다. (고정 해에만 해당).

기준 분산

기준 분산은 기선 해의 예상 오차와 실제 오차의 관계를 나타내는 숫자인데 단위가 없습니다.

참조: 비율과 기준 분산은 항상 같이 평가합니다. 낮은 비율과 높은 기준 분산을 가진 기선은 더 깊은 주의와 분석을 요합니다.

RMS

RMS는 관측치 해 오차의 제곱 평균  제곱근입니다.

참조: 해 요약은 GPS 처리 결과에 대한 개요 만을 보여줍니다. 각 기선 해의 상세한 분석을 원하면 GPS 기선 처리 보고서를 검토하시기 바랍니다. 개별 해가 처리된 직 후에 해당 해를 처리 목록에서 선택한 후 바로 보고서를 누르면 이 보고서를 볼 수 있습니다. 개별 기선에 대한 보고서를 보기 위해서 모든 기선이 다 처리될 때까지 기다릴 필요는 없습니다. 개별 해에 대한 보고서를 검토하는 중에도 처리기는 기선 처리를 계속합니다.

[GPS 처리] 대화상자를 닫은 후에도 그래픽 창에서 기선을 선택한 후 [보고서 / GPS 기선 처리 보고서]를 선택하여 보고서를 볼 수 있습니다. GPS 기선 처리 보고서 설정 대화상자를 통해서 보고서에 포함될 대상 정보를 사용자가 적절히 변경할 수도 있습니다.


    중복 기선 해 덮어쓰기

추가 정보

 기타

이 옵션은 기선을 재 처리한 후에 저장하는 방법을 제어합니다. 기본값에 의해 체크 상자가 선택되어 있으며, 기존의 해에 덮어쓰기를 합니다. 만일 체크 상자가 해제되면 새로운 해는 프로젝트에 추가되면서 기존의 해는 계속 보존됩니다. 이런 경우 새로운 해가 활성해가 되고 기존의 해는 비활성 해가 됩니다. 등록 정보 창을 이용하여 기존의 해를 활성 해로 되돌릴 수 있습니다.

[중복 기선 해 덮어 쓰기] 옵션은 두 번 이상 처리된 기선에만 적용됩니다. 이 옵션은 서로 다른 시각 또는 서로 다른 날짜에 수집된 GPS 데이터에서 계산된 동일한 두 포인트 사이의 기선에는 적용되지 않습니다. Trimble은 항상 중복 기선 해 덮어 쓰기를 권장합니다.

추가 참조

GPS 데이터 처리에는 고려할 사항들이 많습니다. GPS 기선 처리에 관한 좀 더 자세한 내용은 다음 항목들을 참조하시기 바랍니다:

  잠재 기선 결정

  처리할 기선 선택

  GPS 처리 스타일 선택

  기선 처리기 시작

  처리 결과 보기

  처리 결과 저장

  기선 재처리


    GPS 기선 처리 - 내용

내용

다음과 같은 도움말 항목을 이용할 수 있습니다:

  GPS 기선 처리 개요

  GPS 기선 처리

  기선 데이터 출처

  GPS 처리 명령

  GPS 처리 스타일

  GPS 처리 데이터 분석

  GPS 기선 처리 보고서

  Timeline

도움말 사용방법을 알고자 할 경우에는 F1 키를 누릅니다.

본 도움말에서 문제 해결에 필요한 정보를 찾지 못할 경우에는 판매점에 문의하거나 기술 지원을 참조하시기 바랍니다.

© 1999−2002, Trimble Navigation Limited(모든 권리 소유).


    GPS 기선 처리 보고서 - 개요

추가 정보

방법 ...	기타
개요

기선 해에 관한 자세한 정보를 보고자 할 경우에는 GPS 기선 처리 보고서를 이용합니다.

이 기능을 이용하려면:

1.	기선을 처리합니다. [GPS 처리] 대화 상자가 나타납니다.

2.	GPS 처리 목록에서 기선 해를 선택합니다. 해가 하이라이트 됩니다.

3.	보고서를 클릭합니다. 기선 해에 대한 GPS 기선 처리 보고서가 나타납니다.

GPS 기선 처리 보고서에는 다음과 같은 항목이 들어 있습니다:

  처리 요약

  기선 구성요소

  선점

  추적 요약

  잔차

  처리 스타일

보고서에 포함될 항목은 [GPS 기선 처리 보고서 설정] 대화 상자의 현재 설정내용과, 각 기선과 관련하여 처리한 데이터의 종류에 따라 결정됩니다.


    [고급 스타일 편집] 대화 상자 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

GPS 처리 스타일을 이용하면 정밀 궤도력이나 특정 임계 앙각을 가진 처리 등, 특정 필요에 맞도록 처리를 최적화할 수 있습니다. 이 같은 설정들은 스타일 이름을 붙여 저장할 수 있으므로 나중에 간단히 그 스타일의 이름을 지정하여 다시 불러올 수 있습니다. 이렇게 함으로써 처리 스타일 라이브러리가 만들어져 일반적인 처리 시나리오들을 다룰 수 있습니다.

가장 일반적인 내용은 [GPS 처리 스타일] 대화 상자에서 손쉽게 설정할 수 있습니다. 그러나 더 자세한 내용을 추가적으로 설정하여 내용을 보거나 편집할 수 있습니다. 이러한 고급 제어를 위해 또 하나의 대화 상자가 준비되고 이 대화상자 안에는 탭들이 있습니다.

다음과 같은 탭들이 사용됩니다:

  static

  kinematic

  글로벌

  질

  대류권

  전리층

  이벤트

  OTF 검색


    GPS 데이터의 출처 - 개요

추가 정보

 기타

개요

기선 처리기는 GPS 수신기가 수집한 측정치들을 사용하여 기선을 계산합니다. 이러한 측정치들의 출처는 아래와 같은 기기입니다.

  Trimble 데이터 컬렉터 (*.dc)

  Trimble 수신기 (*.dat)

  기타 제조업체 수신기 (RINEX)

이들 기기들은 GPS 측정치 외에도 GPS 측정치를 처리하는 방법을 결정하는 데 도움이 되는 정보를 제공하여 줍니다. 즉, 언제 수신기가 한 포인트에 정지했는지, 또는 언제 수신기가 이동했는지 등의 정보를 제공하여 줍니다. 따라서 기선 처리기는 GPS 측정치를 다음과 같이 분류합니다:

  Static/FastStatic GPS 데이터

  Kinematic 데이터

  이동 및 연속 Kinematic 데이터


    GPS 처리 스타일 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

GPS 처리 스타일을 이용하면 정밀 궤도력이나 특정 임계 앙각을 가진 처리 등, 특정 필요에 맞도록 처리를 최적화할 수 있습니다. 이 같은 설정들은 스타일 이름을 붙여 저장할 수 있으므로 나중에 간단히 그 스타일의 이름을 지정하여 다시 불러올 수 있습니다. 이렇게 함으로써 처리 스타일 라이브러리가 만들어져 일반적인 처리 시나리오들을 다룰 수 있습니다. GPS 처리 스타일은 시스템 전체에 적용됩니다. 따라서 새로운 스타일이나 기존 스타일에 대한 변경 내용은 단일 PC의 모든 프로젝트에서 사용할 수 있습니다.

[GPS 처리 스타일] 대화 상자는 스타일 관련 작업의 제어 센터입니다. 현재 선택 중인 스타일을 활성 스타일 (Active style)이라고 부릅니다. 활성 스타일은 해당 프로젝트의 차후 처리 작업을 위해 기선 처리기에게 처리 조건을 부여하는 데 사용됩니다. 프로젝트 별로 서로 다른 활성 스타일을 가질 수 있으며 활성 스타일은 기선 처리 세션 사이에서 변경이 가능합니다. [GPS 처리 스타일] 대화 상자에서 또한 스타일을 편집, 복사, 새로만들기, 이름 변경, 삭제 등을 할 수 있습니다.

Trimble Geomatics Office 소프트웨어에는 Trimble의 기본 GPS 처리 스타일이 내장되어 있습니다. 대부분의 측량 응용 프로그램에서는 이 스타일을 수정할 필요가 없습니다. 만약 처리 조건을 수정할 경우에는 수정 내용을 저장하기 전에 이들 수정으로 인해 생길 수 있는 결과를 확실히 이해하여야 합니다.

좀 더 자세한 내용은 스타일 편집을 참조하시기 바랍니다.


    GPS 기선 처리 - 개요

추가 정보

 기타

개요

기선 처리기 모듈이 설치되어 있을 경우에는 Trimble Geomatics Office 소프트웨어로 후처리 GPS 기선 해를 만들 수 있습니다. 그리고 기선 처리기 모듈에는 WAVE� (Weighted Ambiguity Vector Estimator) 프로그램이 들어 있습니다. 이 프로그램은 static, FastStatic, 또는 Kinematic 데이터 수집 절차에 의한 GPS 현장 관측치로부터 기선 해를 계산합니다. 기선 처리기는 반송파 위상 및 코드 관측치를 모두 사용하여 측점들 사이에 3 차원의 GPS 기선을 만듭니다.

Trimble Geomatics Office 소프트웨어의 후처리 기능은 사용이 간편합니다. 기선 처리기는 대부분의 측량 프로젝트의 요건을 만족시키는 시스템 기본값을 가집니다. 후처리 조건도 고급 처리 및 재처리의 필요에 따라 수정할 수 있으며 새로운 이름을 붙여 GPS 처리 스타일로 저장할 수 있습니다.

다른 측량 기법을 사용하여 수집한 GPS데이터 경우에도 별도의 처리 세션이 필요하지 않습니다. 기선 처리기가 데이터를 검사하여 처리 방법을 자동으로 결정합니다. 대부분의 경우 고급 설정을 하지 않고 Static, FastStatic, Kinematic 측량을 동시에 처리할 수 있습니다.


    잠재 기선 결정

추가 정보

 기타

두 수신기가 시간적으로 겹치게 수집한 GPS 측정치를 화면에 불러오면 그래픽 창에 잠재 기선이 나타납니다. 겹치는 시간의 길이는 처리에 필요한 최소 길이 이상이어야 합니다. 잠재 기선은 기선 처리기에 의해 처리될 수 있지만 아직 처리가 된 것은 아닙니다.

잠재 기선은Trimble Geomatics Office 소프트웨어에 의해 자동으로 결정됩니다. 새로운 GPS 측정치를 프로젝트로 불러오면 Trimble Geomatics Office 소프트웨어는 처리가 가능한 이것과 중복되는 다른 데이터 세트를 찾습니다. 활성 GPS 처리 스타일의 최소 기선 관측 시간 조건을 만족시키는 두 데이터 세트 사이에 겹치는 시간이 있을 때나, 또는 Kinematic 데이터 세트 내에 선점 식별자가 발견될 때는 언제나 프로젝트에 잠재 기선이 더해집니다.

참조: 데이터를Trimble Geomatics Office 소프트웨어로 가져오기 전에 GPS 기지국으로부터 총 한 시간 이상 되는 데이터 세그먼트들을 다운로드 받았을 때는 Rinmerge 유틸리티를 사용하여 이들을 하나의 파일로 결합하시기 바랍니다.


    처리할 기선 선택

추가 정보

 기타

메뉴에서 [측량 / GPS 기선 처리]를 선택하면 기본 값으로 프로젝트 안의 모든 잠재 기선을 처리합니다. 잠재 GPS 기선들이 모두 프로젝트에 추가되기 때문에 이들을 처리하기 위한 어떤 특별한 절차나 선택이 필요하지 않습니다.

그러나 [측량 / GPS 기선 처리]를 선택하기 전에 하나 또는 그 이상의 특정 기선을 선택함으로써 그 기선들만 처리 또는 재처리를 할 수 있습니다. 하나 또는 그 이상의 기선을 선택했을 때는 선택한 기선만 처리 대상이 됩니다.

대상을 선택할 때는 다음과 같은 표준 방법을 사용합니다:

  그래픽 창에서 하나 또는 그 이상의 기선을 클릭합니다.

  [질의]를 이용하여 선택합니다.

  이전의 [선택 집합]을 이용합니다.

참조: 기선 처리기가 프로젝트 내의 모든 잠재 기선들을 처리하지 않고 기선들이 선택되지 않았음을 알리는 메시지를 표시할 경우에는 GPS 기선이나 Kinematic 베이스가 들어있지 않은 선택 집합을 지정했을 수 있습니다. 이럴 경우에는 그래픽 창에 있는 빈 공간을 한번 클릭한 후 기선 처리기를 다시 시작합니다. [보기 필터] 옵션도 처리 또는 재처리를 위한 벡터의 부분 집합을 식별하는 데 도움이 될 수 있습니다.

프로젝트에 연속 Kinematic 데이터가 포함된 경우에는 모든 미처리 Kinematic 베이스를 처리하는 것을 기본 설정으로 하고 있습니다. 특정 베이스의 연속 Kinematic 데이터를 처리하고자 할 경우에는 베이스가 위치하고 있는 포인트를 먼저 선택한 후 처리를 시작하여야 합니다.

기선들은 순차적으로 처리됩니다. 기선의 방향, 즉 어떤 측점이 베이스로서 사용되며 어떤 것이 로버로서 사용될 지는 처리기에 의해 자동으로 결정됩니다. 이 방향은 정확한 좌표를 전송할 수 있도록 최적화 됩니다. 이와 같이 한 포인트로부터 다른 포인트로 정확한 기준 좌표를 전송하는 것을 좌표 시딩(coordinate seeding)이라고 부릅니다. 기선 처리기는 처리 세션 안에서 가장 높은 질의 포인트들을 자동으로 선택하여 좌표 시드로 사용하며 기선은 이들 포인트로부터 계산되어져 나옵니다.

대부분의 경우에는 처리기가 처리에 적합한 방향을 선택합니다. 기준 및 현장 관측 세션의 설정에 주의를 기울였을 때는 더욱 그렇습니다. 하지만 몇 몇 경우에는 베이스와 로버를 교환하여 기선의 방향을 바꾸는 것이 필요할 수도 있습니다. 처리 후 기선 방향을 변경하고자 할 경우에는 그래픽 창에 있는 지도 상의 기선을 클릭한 후 메뉴에서 [편집 / 관측 방향 반전]을 선택합니다.

[관측 방향  반전]은 특정 방향으로 처리를 실행시키기 위해 사용될 수도 있습니다. 기선 위의 화살표가 기선이 향하는 방향을 나타냅니다. 사용자가 원하는 방향으로 처리를 실행시키고자 할 경우에는 관측방향을 역으로 바꿉니다.

참조: 데이터를Trimble Geomatics Office 소프트웨어로 가져오기 전에 GPS 기지국으로부터 총 한 시간 이상 되는 데이터 세그먼트들을 다운로드 받았을 때는 Rinmerge 유틸리티를 사용하여 이들을 하나의 파일로 결합하시기 바랍니다.


    GPS 처리 스타일 선택

추가 정보

방법 ...	대화 상자
GPS 처리 스타일을 이용하면 정밀 궤도력을 가진 처리나 특정 임계 앙각을 가진 처리 등, 특정 필요에 맞도록 처리를 최적화할 수 있습니다. 이와 같은 설정은 스타일 이름을 붙여 저장할 수 있으므로 나중에 간단히 그 스타일의 이름을 지정하여 다시 불러올 수 있습니다. 이렇게 함으로써 처리 스타일 라이브러리가 만들어져 일반적인 처리 시나리오들을 다룰 수 있는 것입니다. GPS 처리 스타일은 시스템 전체에 적용됩니다. 따라서 새로운 스타일이나 기존 스타일에 대한 변경 내용은 단일 PC의 모든 프로젝트에서 사용할 수 있습니다.

[GPS 처리 스타일] 대화 상자는 스타일 관련 작업의 제어 센터입니다. 현재 선택 중인 스타일을 활성 스타일 (Active style)이라고 부릅니다. 활성 스타일은 해당 프로젝트의 차후 처리 세션을 위해 기선 처리기에게 처리 조건을 부여하는 데 사용됩니다. 스타일 목록에서 하나의 스타일을 선택하면 그 스타일이 해당 프로젝트의 현재 활성 스타일이 됩니다.

프로젝트 별로 서로 다른 활성 스타일을 가질 수 있으며 활성 스타일은 기선 처리 세션들 사이에서 변경이 가능합니다. [GPS 처리 스타일] 대화 상자에서도 스타일을 편집, 복사, 새로만들기, 이름 변경, 삭제 등을 할 수 있습니다.

Trimble Geomatics Office 소프트웨어에는 Trimble의 기본 GPS 처리 스타일이 내장되어 있습니다. 대부분의 측량 응용 프로그램에서는 이 스타일을 수정할 필요가 없습니다. 만약 처리 조건을 수정할 경우에는 수정 내용을 저장하기 전에 이들 수정으로 인해 생길 수 있는 결과들을 확실히 이해하여야 합니다.


    GPS 기선 처리기 사용 시기

추가 정보

 기타

대부분의 측량 기사들은 현장 작업 직후 측량 데이터를 처리하여 혹시 다시 관측하여야 할 기선 이 있는지 확인합니다.

기선 처리기를 사용하기 전에 다음 순서로 작업을 하시기 바랍니다:

  프로젝트를 만듭니다.

  현장 관측 계획을 수립합니다(권장).

  현장에서 데이터를 수집합니다.

  수신기, 측량 장비 또는 사용자 컴퓨터의 데이터를Trimble Geomatics Office 소프트웨어 프로젝트로 다운로드합니다.

일반적으로 기선 처리가 GPS 측량 프로젝트의 최종 절차는 아닙니다. 처리 결과는 GPS 측량치의 전반적인 품질을 반영하지만, 모든 관측치의 망 조정 을 포함시키는 것이 바람직한 측량 관행입니다. 망 내에서 관측된 기선들의 일관성을 확보하기 위해 망 조정이 필요하며 최종 좌표를 만들어 내는 데도 도움이 됩니다. Trimble Geomatics Office 소프트웨어 망 조정 도움말을 참조하시기 바랍니다.


    GPS 기선 처리 명령 - 개요

추가 정보

 기타

개요

GPS 기선 처리 명령은 [측량] 및 [보고서] 메뉴에서 사용할 수 있습니다.

[측량] 메뉴에는 다음과 같은 명령들이 있습니다:

  GPS 처리 스타일

  GPS 기선 처리

[보고서] 메뉴에는 다음과 같은 명령들이 있습니다:

  GPS 기선 처리 보고서

  GPS 기선 처리 보고서 설정

[보기] 메뉴에는 다음과 같은 명령들이 있습니다:

  Timeline

  계획 플롯 (도구 모음)

  Timeline (도구 모음)

GPS 기선 처리 전후에 유용한 [측량 보기] 명령에는 다음과 같은 것들이 있습니다:

  GPS 루프 폐합 보고서

  재계산

  재계산 보고서

  Timeline


    GPS 기선 처리 - 개요

기선 처리기는 static, FastStatic, 또는 Kinematic 데이터 수집 절차를 사용하여 수집한 GPS 현장 관측치로부터 기선을 계산합니다. 기선 처리기는 반송파 위상 및 코드 관측치를 사용하여 측량 포인트들 사이에 3 차원의 GPS 기선을 만듭니다.

GPS 데이터 처리에는 고려할 사항들이 많습니다. GPS 기선 처리에 관한 좀 더 자세한 내용은 다음 항목들을 참조하시기 바랍니다:

  잠재 기선 결정

  처리할 기선 선택

  GPS 처리 스타일 선택

  기선 처리기 시작

  처리 결과 보기

  처리 결과 저장

  기선 재처리


    GPS 기선 처리기 시작

추가 정보

방법 ...	대화 상자	기타
기선 처리기는 [측량 보기]에서 만 사용할 수 있고, GPS 측정치를 가진 두 개 또는 그 이상의 파일을 프로젝트로 불러온 경우에만 사용할 수 있습니다.

모든 잠재 기선 처리

모든 잠재 기선들을 처리하고자 할 경우에는:

1.	하나 또는 그 이상의 잠재 기선을 가지는 프로젝트를 엽니다.

2.	처리기를 시작하기 위해 다음 중 하나의 방법을 사용합니다:

  [측량] 메뉴로부터 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 Trimble Survey 그룹으로부터[GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 [처리] 그룹으로부터[GPS 기선 처리]를 선택합니다.

  F9 키를 누릅니다.

[GPS 처리] 대화 상자가 나타나면서 기선 처리기가 모든 잠재 기선들을 처리하기 시작합니다.

선택한 하나 또는 그 이상의 기선 처리

선택한 하나 또는 그 이상의 기선을 처리 (또는 재처리) 하고자 할 경우에는:

1.	하나 또는 그 이상의 잠재 기선이나 저장된 기선을 가진 프로젝트를 엽니다.

2.	처리할 기선을 여러 개 선택하고자 할 경우에는 다음 중 하나의 방법을 사용합니다:

  그래픽 창에서 하나 또는 그 이상의 기선을 클릭합니다.

  [질의]를 이용하여 해당 기선들을 선택합니다.

  이전에 설정해 놓은 [선택 집합]을 이용합니다.

3.	선택된 기선들이 그래픽 창에서 두꺼운 실선으로 나타납니다

4.	처리기를 시작하려면 다음 중 하나의 방법을 사용합니다:

  [측량] 메뉴로부터 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 Trimble Survey 그룹으로부터[GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 [처리] 그룹으로부터[GPS 기선 처리]를 선택합니다.

  F9 키를 누릅니다.

[GPS 처리] 대화 상자가 나타나면서 기선 처리기가 모든 선택된 기선들을 처리하기 시작합니다.

연속 Kinematic 기선 처리

연속 Kinematic 기선들을 처리하고자 할 경우에는:

1.	연속 Kinematic 데이터를 가진 프로젝트를 엽니다.

2.	측량하는 동안 베이스 수신기가 위치했던 포인트를 선택합니다.

3.	처리기를 시작하기 위해 다음 중 하나의 방법을 사용합니다:

  [측량] 메뉴로부터 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 Trimble Survey 그룹으로부터[GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 [처리] 그룹으로부터[GPS 기선 처리]를 선택합니다.

  F9 키를 누릅니다.

[GPS 처리] 대화 상자가 나타나면서 기선 처리기가 Kinematic 기선들을 처리하기 시작합니다.

복수의 특정 연속Kinematic 기선들의 처리

복수의 특정 연속 Kinematic 기선들을 처리하고자 할 경우에는:

1.	연속 Kinematic 데이터를 가진 프로젝트를 엽니다.

2.	Timeline을 보기위해 다음 중 하나의 방법을 사용합니다 :

  보기 / Timeline을 선택합니다.

  Alt+VI 키를 누릅니다.

Timeline 보기 영역이 나타납니다.

3.	해당 측량 작업의 베이스 수신기 선점을 선택합니다.

4.	처리기를 시작하기 위해 다음 중 하나의 방법을 사용합니다:

  [측량] 메뉴로부터 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 Trimble Survey 그룹으로부터[GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 [처리] 그룹으로부터[GPS 기선 처리]를 선택합니다.

  F9 키를 누릅니다.

[GPS 처리] 대화 상자가 나타나면서 기선 처리기가 Kinematic 기선들을 처리하기 시작합니다.

[GPS 처리] 대화 상자의 상태 표시줄 보기

[GPS 처리] 대화 상자 아래에 있는 상태 표시줄은 처리 대상의 각 파일을 로드시킬 때 진행 상태를 보여줍니다. 처리하는 동안 각 기선의 시작 스테이션과 끝 스테이션의 이름이 나타나며, 각 기선의 처리가 완료되면 즉시 GPS 처리 목록에 한 줄로 된 요약이 나타납니다. 기선 처리기는 계속해서 다음 기선을 처리하기 위한 작업을 착수합니다. 상태 표시줄은 각 기선이 처리될 때마다 현재의 상태를 보여주며 변합니다. 상태 표시줄은 또한 활성 GPS 처리 스타일에서 설정한 수용 기준에 근거하여 수용된 기선과 기각된 기선의 수를 보여 줍니다.

기선 처리 세션에 관한 좀 더 자세한 내용은  기선 처리 로그를 참조하시기 바랍니다.


    처리 결과 보기

추가 정보

방법...	대화 상자	기타
기선을 처리할 때는 GPS 처리 대화 상자가 자동으로 나타납니다. 대화 상자 아래에 있는 상태 표시줄은 처리 대상의 각 파일을 로드시킬 때 진행 상태를 보여줍니다. 처리하는 동안 각 기선의 시작 스테이션과 끝 스테이션의 이름이 나타나며 각 기선의 처리가 완료되면 즉시 GPS 처리 목록에 한 줄로 된 요약이 나타납니다. 기선 처리기는 계속해서 다음 기선을 처리하기 위한 작업을 착수합니다. 상태 표시줄은 각 기선이 처리될 때마다 현재의 상태를 보여주기 위해 변경됩니다. 상태 표시줄은 또한 활성 GPS 처리 스타일에서 설정한 수용 기준에 근거하여 수용된 기선과 기각된 기선의 수를 보여 줍니다.

좀 더 자세한 내용은  아래의 항목들을 참조하시기 바랍니다:

  [GPS 처리] 대화 상자 사용

  GPS 기선 처리 보고서 사용


    [GPS 처리] 대화 상자 사용

추가 정보

방법 ...	대화 상자	기타
[GPS 처리] 대화 상자에서는 아래와 같은 정보를 볼 수 있습니다:

  처리 상태

  처리된 기선의 수

  수용된 기선과 기각된 기선의 수

  한 줄로 된 요약들로 구성된 도표 형식의 처리 결과

  처리된 기선들의 [미저장] 표시

[GPS 처리] 대화 상자에는 다음과 같은 기능들도 있습니다:

  프로젝트에 기선 처리 결과의 저장

  GPS 기선 처리 보고서 작성

  재처리 후 기선 저장 방법 제어

아래와 같은 기능들을 사용할 수 있습니다:

GPS 처리 목록

GPS 처리 세션의 결과를 점검하고자 할 경우에 이 목록을 관찰합니다. 목록의 열에 관한 자세한 정보는GPS 처리 목록을 참조하시기 바랍니다.

GPS 처리 상태 표시기

GPS 처리 상태 표시기는 상태 표시줄에 나타납니다. 이 표시기를 클릭하면 [GPS 처리] 대화 상자가 중앙으로 다시 이동합니다.

상태 표시줄 맨 왼쪽에 있는 진행 표시기는 각 기선 처리 해의 진행 상태를 보여줍니다.

두 번 째 표시기는 GPS 처리기에 의해 생성된 메시지를 보여 줍니다. 작업이 진행되면서 각 기선의 시작 포인트와 끝 포인트가 표시됩니다.

오른 쪽에서 세 번 째 상태 표시기에는 처리할 파일들의 수와 앞으로 처리할 기선들의 수가 나타납니다. 이 표시기는 모든 기선들이 처리된 후 그 해들을 프로젝트에 저장하기 위해 저장을 클릭하지 않는 한 [미저장] 이라고 표시합니다.

오른 쪽 끝의 상태 표시기는 수용된 기선 해와 기각된 기선 해의 수를 보여줍니다.

멈춤 / 저장

처리가 완료되기 전에 멈춤을 클릭함으로써 기선 처리 세션을 취소시키지 않고 정지시킬 수 있습니다. 처리가 완료된 후에는 멈춤 단추가 저장 단추로 바뀝니다. GPS처리 목록에서 선택한 해를 프로젝트에 저장하고자 할 경우에는 저장을 선택합니다. 선택된 기선 해는 [사용] 표시 난에 있는 체크 표시로 식별됩니다. 저장은 아래의 설명처럼 중복 기선 해 덮어 쓰기 선택 여부에 의해서도 영향을 받을 수 있습니다.

취소

GPS 처리 세션이 시작된 후 이를 취소하고자 할 경우에는 어느 때든 취소 단추를 선택합니다.

  만약 이 단추를 클릭했을 때 GPS 처리가 이미 완료되었을 경우에는 확인을 요청하는 메시지가 나타납니다. 예를 클릭하면 이미 처리된 해가 삭제되면서 대화 상자가 닫힙니다. 아니오를 클릭하면 [GPS 처리] 대화 상자로 돌아갑니다.

  만약 이 단추를 클릭했을 때 GPS 처리가 진행 중일 경우에는 현재의 기선 해는 완료되면서 처리가 정지되고 확인 메시지가 나타납니다. 예를 클릭하면 이미 처리된 해는 삭제되면서 대화 상자가 닫힙니다. 아니오를 클릭하면 [GPS 처리] 대화 상자로 돌아갑니다.

보고서

선택된 기선 해의 GPS 기선 처리 보고서를 작성하고자 할 경우에 이 단추를 선택합니다. 이 단추를 사용하기 전에 반드시 GPS 처리 목록으로부터 기선 해를 하이라이트하여 선택하여야 합니다.

중복 기선 해 덮어 쓰기

기선을 재처리한 후 저장하는 방법을 제어하기 위해 이 옵션을 사용합니다. 이 난은 기본 설정으로 체크되어 있으며, 기존의 해가 덮여 쓰이게 됩니다. 만약 이 난의 체크 표시를 해제하면 프로젝트에 새로운 해가 추가되면서 전에 있던 해는 계속 보존됩니다. 이 같은 경우에는 새로운 해가 활성 해가 되며 기존의 해는 비활성 해가 됩니다. 등록 정보 창을 이용하여 기존의 해를 활성 해로 되돌릴 수 있습니다.

[중복 기선 해 덮어 쓰기] 옵션은 두 번 이상 처리된 기선에만 적용됩니다. 그러나 서로 다른 시각 또는 서로 다른 날짜에 수집된 GPS 데이터에서 계산된 동일한 두 포인트 사이의 기선에는 적용되지 않습니다. Trimble은 항상 [중복 기선 해 덮어 쓰기]를 권장합니다.


    GPS 기선 처리 보고서 사용

추가 정보

방법 ...	대화 상자	기타
GPS 기선 처리 보고서는 기선 해에 관한 자세한 정보를 제공합니다.

GPS 기선 처리 보고서를 작성하려면 다음 중 하나의 방법을 사용합니다:

  [GPS 처리] 대화 상자에서 해당 기선을 더블 클릭합니다.

  [GPS 처리] 대화 상자에서 기선을 선택한 후 보고서를 클릭합니다.

  그래픽 창에서 기선을 선택한 후 [보고서 / GPS 기선 처리 보고서]를 선택합니다.

[GPS 기선 처리 보고서]는 다음의 경우에도 사용할 수 있습니다:

  NEU (North-East-Up)의 오차, 사용된 측정치의 수, 기각된 측정치의 수 등 한줄로 된 요약에서는 나타나지 않는 기선 해의 내역을 검토합니다.

  해의 측점 정보와 필드 노트와 비교합니다. 여기에서 특히 주의를 요하는 항목은 다음과 같습니다:

  측점 이름

  안테나 높이, 종류 및 측정 방법

  시작 시간 및 정지 시간

  각 측점에서 L1 또는 L2 신호의 중단(또는 공백)에 대한 위성 위상 추적 요약을 확인합니다.

  결합 위성 위상 추적 요약을 확인합니다. 옅은 회색 표시는 기선 해에서 실제적으로 사용된 측정치들을 나타냅니다.

  각 위성에 대한 잔차 플롯을 확인합니다. 이들 잔차 플롯은 기선 해를 정하는데 사용된 각 위성의 RMS를 나타냅니다.


    처리 결과 저장

추가 정보

대화 상자	기타
GPS 처리 목록에서 선택한 기선 해를 프로젝트에 저장하고자 할 경우에는 GPS 처리 대화 상자 안의 저장 단추를 클릭합니다. 선택된 기선 해는 [사용] 표시 난의 체크 표시로 알 수 있습니다.

만약 처리 세션이 재처리된 기선을 포함하고 있다면 저장은 중복 기선 해 덮어 쓰기 선택 표시 난에 의해 영향을 받습니다. 이 옵션은 기선을 재처리한 후 어떻게 저장할 것인가를 제어하기 위해 사용합니다. [중복 기선해 덮어 쓰기] 체크 난은 기본 설정으로 체크되어 있어 기존의 해를 덮어 쓰도록 하고 있습니다. 만약 [중복 기선해 덮어 쓰기] 표시 난의 체크 표시를 해제하면 새로운 해가 프로젝트에 추가되면서 전에 있던 해는 계속 보존됩니다. 이 같은 경우에는 새로운 해가 활성 해가 되며 기존의 해는 비활성 해가 됩니다. 등록 정보 창을 이용하여 기존의 해를 활성 해로 되돌릴 수 있습니다.

[중복 기선 해 덮어 쓰기] 옵션은 두 번 이상 처리된 기선에만 적용됩니다. 이 옵션은 서로 다른 시각 또는 서로 다른 날짜에 수집된 GPS 데이터에서 계산된 동일한 두 포인트 사이의 기선에는 적용되지 않습니다. Trimble은 항상 중복 기선 해 덮어 쓰기를 권장합니다.


     L1 고정

 개요 및 추가 정보

수 km 길이의 짧은 기선의 경우, 이중 주파수 데이터가 처리에 사용되면 전리층 무영향 고정 대신에 L1-only 최종 통과가 만들어 집니다. 하지만 이 최종 L1-only 해는 L1 모호성의 도출을 위해 이중 주파수 데이터를 사용하여 만들어 집니다. 약 5 km 이내의 기선에서는 L1 고정 해가 잡음이 적다는 이유로 일반적으로 선호됩니다.

L1-only 해의 차단 값은GPS 처리 스타일을 사용하여 정할 수 있습니다.


    전리층 무영향 고정

 개요 및 추가 정보

전리층 무영향 고정 해는 가장 광범위한 여러 조건에 맞는 최적의 해입니다. 이 해는 아무런 전리층 편기(bias)도 가지고 있지 않습니다. 고정 모호 정수는 전반적으로 최상의 결과를 가져다 줍니다.

하지만 짧은 기선 상의 전리층 무영향 고정 해는 신뢰성이 떨어지는 해가 될 수도 있습니다. 짧은 기선에서는 이러한 해의 사용을 피하시기 바랍니다. Trimble Geomatics Office 소프트웨어는 자동으로 짧은 기선을 식별하고 그에 알맞은 최종 해 유형을 선택합니다.

좀 더 자세한 내용은 L1 고정 을 참조하시기 바랍니다.


    L1 유동

 개요 및 추가 정보

단일 주파수 데이터를 처리할 때 L1 모호정수가 적절히 정해지면 기선 처리기는 L1 고정 최종 통과 해를 만들어 냅니다. 하지만 L1 검색이 원활이 되지 않았다 하더라도 L1 유동 해는 만들어집니다. 매우 짧은 기선에 대한 L1 유동 해는 선점이 너무 짧았을 경우나, 관측 잡음이 이례적으로 심할 때 나타날 수 있습니다. 10 내지 15 km 이상의 기선에 있어서는 단일 주파수 관측치가 전리층 지연에 대해 민감하기 때문에 신뢰할만한 L1 고정 해를 얻기가 점점 어려워 질 수 있습니다.

L1 유동 해는 일반적으로 고정 정수 해보다 신뢰도가 떨어집니다. 표준 측량 응용 프로그램에 L1 유동 해는 사용하지 않기를 권장합니다. 데이터를 재처리하거나 작업 현장에서 이 기선들을 재관측하는 것이 바람직합니다.

고정 정수 해를 만드는 결정은 기선 처리기에 의해 내부적으로 지정된 비율 차단에 의해 제어됩니다. 차단은 1.5로 설정되어 있고 계산된 비율이 내부의 비율 차단 값보다 작을 경우에 유동 해가 만들어집니다.


    전리층 무영향 유동

 개요 및 추가 정보

30 km보다 긴 기선 상의 전리층 무영향 유동 해는 상당히 훌륭한 해일 수 있습니다. 그러나 반드시 확인하여야 합니다. 매우 긴 기선 상에서는 전리층 무영향 유동 해가 얻을 수 있는 최적의 해일 수 있습니다. 더 긴 선점 시간은 더 나은 전리층 무영향 유동 해를 만들어 줍니다. 이는 편기(bias)가 없는 전리층 무영향 관측량이 해로 하여금 정확한 기하학적 결과에 수렴토록 하기 때문입니다. 실제로 매우 긴 기선 상의 전리층 무영향 유동 해를 수 시간 동안 선점할 경우 매우 훌륭한 결과를 얻을 수 있습니다.

수 백 km에서 수 천 km의 매우 긴 기선에서는, 이중 주파수 데이터를 사용하여 전리층 무영향 유동 해를 만들기 위해 유동해 유형을 선택합니다. 앞에서 언급한 것처럼 매우 긴 기선 상에서 긴 점유 시간으로 매우 훌륭한 전리층 무영향 유동 해를 얻을 수 있습니다.

매우 긴 기선의 유동 해를 차단하기 위해 사용되는 값은GPS 처리 스타일을 사용하여 정할 수 있습니다. 방송 궤도력과 정밀 궤도력의 사용을 위해서는 별도의 기준을 설정할 수 있습니다.


    GPS 처리 데이터 분석 - 개요

추가 정보

방법 ...	대화 상자	기타
개요

측정치의 질을 분석하는 것은 중요한 작업입니다. 전통적인 방법으로 물리적 거리나 각도를 측정하는 것과는 달리 관측(위성으로부터 반송파 위상 데이터의 수집) 내용은 사후 처리 방법으로 그 결과를 분석할 수 있습니다. 정확하게만 따르면 보다 나은 GPS 측량치 결과를 얻을 수 있는 몇 가지 간단한 지침들이 있습니다.

기선 처리 결과가 기대 수준에 미치지 못할 경우에는 현장에 다시 나가 문제가 있는 기선들을 재 관측하기 전에 처리 결과를 향상시킬 수 있는 몇 가지 방법이 있습니다. GPS 기선 처리 보고서의 정보는 위성 신호의 간섭 현상을 알아내고 신호에 문제가 발생한 관측 시간을 찾아내는데 도움이 됩니다. 이 보고서는 다른GPS 처리 스타일을 이용하여 데이터를 재 처리하기로 할 경우에도 유용합니다.

예상되는 문제점들

불량한 GPS 처리 결과는 다양한 원인으로 발생합니다. 다음이 그 예입니다:

  다음과 같은 현장에서의 실수:

  부정확한 안테나 높이

  부정확한 측점 이름

  삼각대 중심 오류

  다음과 같은 수신기 설정의 모순:

  동기화 율

  위성의 이용/불이용 상태

  데이터 포맷

  다음과 같은 제한 조건에서 데이터 수집:

  너무 적은 수의 위성

  높은 PDOP

  너무 많은 위성이 낮은 앙각에 위치

  열악한 다중 경로 조건

  많은 사이클 슬립

  불충분한 관측 시간

예상되는 오류의 첫 번 째 범주는 작동자의 실수나 부주의입니다. 현장에서 적합한 작업 절차를 채택함으로써 부주의에서 오는 실수는 줄일 수 있습니다. 안테나 높이를 피트 (feet)와 미터 (meter)의 두 가지로 측정 기록하며, 선점이 시작될 때와 끝날 때마다 안테나 높이를 기록한다면 측정 오차를 없앨 수 있습니다. 고정 높이의 삼각대를 사용하면 줄자를 읽을 때의 오차를 줄이고 따라서 차후에 발생하는 숫자의 정정을 피할 수 있습니다. 측점의 이름, 위치, 관측 시간 및 안테나 높이 등에 관해 분명하고 정확한 현장 기록을 남겨 두면 데이터 처리 시 문제가 발생할 경우 크게 도움이 됩니다.

예상되는 오류의 두 번 째 범주는 좀더 어려운 부분입니다. GPS 측량에서는 항상 여섯 개의 위성, 양호한 PDOP, 나무 등이 없이 탁트인 장소, 그리고 방해가 없는 시야 등을 확보하는 것이 이상적 입니다. 하지만 이러한 상황을 기대하기란 어렵습니다. 따라서 이러한 현실 조건을 고려하여 현장에서 검증된 방법을 활용하는 것이 바람직 합니다.

질의 향상

GPS 측량 결과의 정확성을 극대화하기 위해 몇 가지 조치를 취할 수 있습니다. 다음의 지침들을 참고하시기 바랍니다:

  제한된 작업 환경 속에서도 가능한 최선의 조건을 선택합니다. QuickPlan을 활용하여 적당한 PDOP의 기간과 충분한 수의 위성을 선택합니다. 수직 결과의 질을 극대화 하기 위해서는 VDOP도 같이 검토합니다..

  미리 측점들을 방문하여 측량에 지장이 되는 것들이나 다중 경로의 원인이 될 수 있는 것들을 찾아 봅니다. 가능하다면 방해물이 많은 측점들은 다른 곳으로 옮깁니다. 이는 Kinematic 측량의 기지국에서 특히 중요합니다.

  동일한 세션 동안 사용하는 모든 수신기의 설정 사이에 호환성이 유지되는지 확인합니다.

  주어진 조건 하에서 어느 정도가 적정한 길이의 측량 시간인지 관측합니다. 지침들에 대해서 확신이 서지 않을 때는 좀 더 경험을 쌓을 때까지 관측 시간을 약간 늘립니다. Kinematic 측량 경우에는 초기화에 특히 주의하여 static 초기화나 on-the-fly 초기화 시간을 약간 늘립니다. 관측 시간을 줄여 갈수록 기선을 재관측 해야 할 확률은 높아집니다.

  좋은 측량 습관을 기르고 여분의 측정치를 만듭니다. 중요한 기선은 별도의 세션으로 두 번 씩 관측합니다. 모든 측점에 적어도 세 개의 별도 기선이 부여될 수 있도록 망을 디자인합니다. 그렇게 함으로써 기선 관측치 중 어떤 하나를 해결할 수 없는 경우에도 현장에 다시 갈 필요 없이 측점 좌표를 계산할 수 있습니다.

  두 개 또는 그 이상의 세션에서 관측된 기선들로부터 폐쇄된 조그만 도형이 만들어지도록 망을 구성합니다. 이렇게 할 때 루프 폐합이 의미를 갖게 됩니다. 만약 어떤 한 루프의 모든 기선이 동일한 세션에서 만들어지면, 그 세션 내의 모든 기선에 공통적으로 적용되는 측점 설정 상의 오류는 발견할 수 없습니다.

  기선 처리기의 작업 결과를 분석하는 법을 배웁니다. 몇 가지의 간단한 지침을 활용하면 사소한 잘못들을 찾아내고 이를 분석할 수 있습니다. (처리 결과의 분석에 관한 설명은 후술함.)

  망 조정 모듈이 설치되어 있으면 그것을 이용합니다. 모든 기선들을 통합하고 이들을 동시에 조정하기 전에는 작업을 완료했다고 할 수 없습니다. 망을 철저히 조정함으로 망의 실수 및 시스템 상의 오류들을 찾아 낼 수 있습니다.

위에 열거한 방법들을 사용하고,  동시에 재계산, 루프 폐합, 망 조정 모듈 (선택 사양임) 등 Trimble Geomatics Office 소프트웨어에서 제공하는 주요 도구를 사용하면 프로젝트에 필요한 제 요건을 충족시킬 수 있게 해 줍니다.

다음의 항목은 GPS데이터의 질을 처리, 검토, 향상시키는데 도움이 되는 추가 지침들입니다.

  GPS 기선 처리 보고서

  문제가 있는 기선의 재처리

  Timeline에 의한 데이터 검토

  사이클 슬립 보정

  잘못된 거리 데이터

  GPS 관측치 불이용

  선택한 위성 불이용


    다중 경로

 개요 및 추가 정보

다중 경로 현상은 GPS 위성 신호가 여러 표면에 반사하도록 하기 때문에 그 신호의 전송 시간을 증가 시킵니다. 다중 경로의 일반적인 원인으로는 다음과 같은 것들을 들 수 있습니다:

  강, 호수, 바다

  빌딩

  자동차

  철사로 엮은 담장

특히 도심 지역에서는 상당히 많은 다중 경로의 문제가 야기됩니다.

잔차 플롯 에서는 다중 경로를 플롯 내의 기본 Sine 곡선으로 나타냅니다. Sine 곡선의 크기는 위성 신호의 강도에 따라, 그리고 다중 경로 물체와 수신기의 안테나 위상 센터 사이의 거리에 따라 다릅니다. 다중 경로는 15 분 이하의 데이터에서는 식별하기가 어렵습니다. 어떤 지역의 다중 경로가 의심될 때는 기선 처리기가 다중 경로의 현상에도 불구하고 충분한 데이터를 얻을 수 있도록 선점 시간을 더 길게 잡아야 합니다. 그라운드 플레인(ground plane) 안테나나 쵸크링(choke ring) 안테나를 사용하면 이러한 다중 경로 현상을 줄이는데 도움이 됩니다.


     기선 재처리

추가 정보

방법 ...	기타
기선 을 재 처리하려면 다음의 절차를 따릅니다:

1.	재 처리에 사용할 활성 GPS 처리 스타일을 선택합니다.

2.	재 처리할 기선을 여러 개 선택하기 위해 다음 중 하나의 표준 방법을 사용합니다:

  그래픽 창에서 하나 또는 그 이상의 기선을 선택합니다.

  [질의]를 이용하여 기선을 선택합니다.

  이전에 설정한 [선택 집합]을 이용합니다.

3.	다음 중 하나의 방법을 사용하여 처리기를 작동합니다:

  [측량] 메뉴로부터 [GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 Trimble Survey 그룹으로부터[GPS 기선 처리]를 선택합니다.

  프로젝트 표시줄에 있는 [처리] 그룹으로부터[GPS 기선 처리]를 선택합니다.

[GPS 처리] 대화 상자가 나타나며 기선 처리기가 선택된 모든 기선들의 재 처리를 시작합니다. GPS 처리 목록 을 이용하여 처리 결과를 평가하고, 새로운 결과들을 보관할 것인지 버릴 것인지를 결정합니다. 새로운 결과들을 프로젝트에 저장하기 전에 [중복 기선 해 덮어 쓰기]의 선택 표시 난의 상태를 확인해야 합니다.

중복 기선 해 덮어 쓰기 선택 표시 난은 기선들을 재 처리한 후 어떻게 저장할 것인지를 제어합니다. [중복기선 해 덮어 쓰기] 선택 표시 난은 기본 설정으로 선택되어 있기 때문에, 기존의 해가 덮여 쓰이게 됩니다. 만약 이 난의 선택이 해제 되어 있으면 새로운 해가 프로젝트에 추가되면서 전에 있던 해는 계속 보존됩니다. 이 같은 경우에는 새로운 해가 활성 해가 되며 기존의 해는 비활성 해가 됩니다. 등록 정보 창을 이용하여 기존의 해를 활성 해로 되돌릴 수 있습니다.

[중복 기선 해 덮어 쓰기] 선택 표시 난은 두 번 이상 처리된 기선에만 적용됩니다. 이 기능은 서로 다른 시각 또는 서로 다른 날짜에 수집된 GPS 데이터에서 계산된 동일한 두 포인트 사이의 기선에게는 적용되지 않습니다. 항상 중복 기선 해 덮어 쓰기를 권장합니다.


    사이클 슬립

 개요 및 추가 정보

사이클 슬립은 연속 위성 추적에서 발생하는 불 연속 현상입니다. 연속 반송파 추적 중 수신기가 계산하는 파면(wave front)도 사이클이라고 불립니다. 따라서 위성 추적의 중단으로 인해 수신기가 파장을 세지 못 할 때 사이클 또는 파장의 계산에 착오가 발생합니다. 이와 같은 사이클 슬립이 발생하면 연속 반송파 위상을 재 설정하여야 합니다. 기선 처리기가 계산 과정에서 그 계산을 다시 할 수 있다면 이러한 것이 반드시 나쁜 상황은 아닙니다.

정지 중이든 이동 중이든 위성 신호를 방해하는 것들은 여러 가지가 있습니다. 정지한 상태에서는 위성이 약하거나 위성의 앙각이 낮을 때, 또는 나무 등과 같은 방해물로 인해 신호가 중단될 때 슬립이 발생합니다. 이동 중에는 사이클 슬립을 일으키는 원인들이 다양합니다. 다리 아래를 통과할 때, 터널을 지나갈 때, 나무 아래를 지나갈 때, 또는 단순히 손으로 GPS 안테나를 가리게 되었을 때 등이 그 예입니다. 사이클 슬립을 일으킬 수 있는 상황을 항상 주의하고 가능한 한 그러한 상황들을 피하는 것이 바람직합니다.


    GPS 기선 처리 보고서 - 처리 요약

GPS 기선 처리 보고서를 보면 어떤 기선이 잘 처리되었고 어떤 기선이 좀 더 검토를 요하는지 신속히 알 수 있습니다.

기선 [처리 요약]을 보려면 다음 중 하나의 방법을 사용합니다:

  [GPS 처리] 대화 상자에서 한 줄로 된 요약을 더블 클릭합니다

  [GPS 처리] 대화 상자에서 한 개 또는 그 이상의 기선을 선택한 후 보고서를 클릭합니다.

  그래픽 창에서 원하는 기선을 선택한 후 보고서 / GPS 기선 처리 보고서를 선택합니다.

다음과 같은 정보가 나타납니다:

열	정보 내용
ID	기선 식별자.
시작 스테이션	GPS 관측이 시작되는 측점의 이름.
끝 스테이션	GPS 관측이 종료되는 측점의 이름.
기선 길이	시작 스테이션과 끝 스테이션 사이의 기선의 길이.
해 유형	해 유형. 가장 일반적인 해 유형은 짧은 기선의 경우에는 L1 고정 해, 중간 기선의 경우에는 전리층 무영향 고정 해, 아주 긴 기선의 경우에는 전리층 무영향 유동 해가 사용됨.
비율	기선 처리기가 최저의 분산 값을 가진 두 해를 비교함. 비율은 차선 해의 분산 값을 최적 해의 분산 값으로 나눈 값임.  참조: 고정 해에만 해당됨.
기준 분산	기준 분산이란 관측된 데이터가 기선 해에 얼마나 적합한지를 나타내는 단위 없는 수치임.
RMS	RMS (Root Mean Square - 제곱 평균 제곱근). RMS는 위성 관측치의 측정 잡음에 근거한 해의 품질을 나타내며 위성 기하와는 관계없음.


GPS 기선 처리 보고서 - 기선 요약

GPS 기선 처리 보고서의 [기선 요약] 섹션은 특정 기선에 대한 요약 정보를 보여 줍니다. 기선 요약 정보를 보고자 할 경우에는:

1.	보고서 / GPS 기선 처리 보고서를 선택합니다. 기선 처리 보고서가 나타납니다.

2.	[처리 요약]으로부터 원하는 기선을 선택합니다.

[기선 요약]에는 다음과 같은 정보가 나타납니다:

필드	정보 내용
처리일	해가 처리된 요일, 날짜 및 시간.
해 유형	가장 일반적인 유형은 짧은 기선의 경우에는 L1 고정 해, 중간 기선의 경우에는 전리층 무영향 고정 해, 아주 긴 기선의 경우에는 전리층 무영향 유동 해가 사용됨.
해 수용 가능성	[GPS 처리 스타일] 대화 상자에 설정한 수용 기준에 해가 통과 되는지의 여부.
이용한 위성 궤도력	기선 해를 결정할 때 이용된 위성 궤도력 (방송 궤도력 또는 정밀 궤도력 여부).
기상 데이터	이용된 기상 모델.
기선 사거리	기선의 경사 거리.
임계 앙각	처리 중 설정된 임계 앙각. 이 값은 [GPS 처리 스타일] 대화 상자에서 설정됨.
분산 비율	기선 처리기가 최저의 분산 값을 가진 두 해를 비교함. 비율은 차선 해의 분산 값을 최선 해의 분산 값으로 나눈 값임.  참조: 고정 해에 만 해당됨.
기준 분산	기준 분산이란 관측된 데이터가 기선 해에 얼마나 적합한지를 나타내는 단위 없는 수치임.
RMS	RMS (Root Mean Square). RMS는 위성 관측치의 측정 잡음에 근거한 해의 품질을 나타내며 위성 기하와는 관계없음.
수평 정밀도	관측치의 수평 정밀도.
수직 정밀도	관측치의 수직 정밀도.
시작 시간 (GPS 시간)	GPS 관측의 시작 시간.
정지 시간 (GPS 시간)	GPS 관측의 정지 시간.
선점 시간	선점의 길이 즉, GPS 관측의 시작 시간과 정지 시간 사이의 길이.


GPS 기선 처리 보고서 - 기선 구성요소

GPS 기선 처리 보고서의 [기선 구성요소] 섹션은 관측 동안에 선점된 두 포인트의 좌표를 보여줍니다. 또한 두 포인트 간의 기선 구성요소, 표준 오차 및 사후 공분산 행렬도 보여줍니다.

[기선 구성요소] 섹션을 보려면:

1.	보고서 \ GPS 기선 처리 보고서를 선택합니다. GPS 기선 처리 보고서가 나타납니다.

2.	처리 요약으로부터 원하는 기선을 선택합니다. [기선 요약]이 나타납니다.

3.	내용으로부터 [기선 구성요소]를 선택합니다.

각 포인트의 좌표가 그리드, 로컬, WGS-84 좌표로 표시됩니다.

기선 구성요소 테이블에는 다음과 같은 필드가 나타납니다:

  델타 위거, 경거 및 표고

  법선면 전방 방위각

  타원체 거리

  델타 고도

  델타 X, Y 및 Z

표준 오차 테이블에는 다음과 같은 필드가 나타납니다:

  σ 위거, σ 경거, σ 표고

  σ 법선면 방위각

  σ 타원체 거리

  σ 델타 고도

  σX, σY, σZ

공분산 정보는 사후 공분산 행렬 테이블에 나타납니다.


GPS 기선 처리 보고서 - 선점

기선 처리 보고서의 [선점] 섹션은 측량에서 포인트를 관측하는데 사용된 GPS 수신기 및 안테나의 내역을 보여줍니다.

[선점] 섹션을 보려면:

1.	보고서 \ GPS 기선 처리 보고서를 선택합니다. GPS 기선 처리 보고서가 나타납니다.

2.	처리 요약으로부터 원하는 기선을 선택합니다. [기선 요약]이 나타납니다.

3.	내용으로부터 [선점]을 선택합니다.

다음과 같은 정보가 나타납니다:

필드	정보 내용
포인트 이름	GPS 수신기에 의해 점유된 포인트의 이름.
데이터 파일	기점과 대상점에 데이터를 저장하기 위해 사용된 파일 이름 (.dat 파일).
수신기 종류	관측에 사용된 GPS 수신기의 종류.
수신기 일련번호	GPS 수신기의 일련번호.
안테나 종류	GPS 안테나의 종류.
높이 지점	안테나 높이를 결정할 때 측정된 GPS 안테나 상의 높이지점.
안테나 높이	측정된 GPS 안테나의 높이 또는 안테나 페이즈 센터 (APS)까지의 안테나의 높이. 참조: APS 값은 안테나의 종류에 따라 계산됨.
안테나 모델	GPS 안테나의 모델.


GPS 처리 보고서 - 처리 스타일

기선 처리 보고서의 [처리 스타일] 섹션은 처리에 사용된 여러 가지 제어사항을 요약해 보여줍니다. 이러한 제어 사항은 [GPS 처리 스타일] 대화 상자에서 설정되며, GPS 기선 처리에는 반드시 정확한 설정을 사용해야만 합니다.

[처리 스타일] 섹션을 보려면:

1.	보고서 / GPS 기선 처리 보고서를 선택합니다. GPS 기선 처리 보고서가 나타납니다.

2.	처리 요약으로부터 원하는 기선을 선택합니다. [기선 요약]이 나타납니다.

3.	내용으로부터 [처리 스타일]을 선택합니다.

다음과 같은 필드가 나타납니다:

섹션	필드
처리 스타일 − 사용된 처리 스타일의 이름을 보여줌.	임계 앙각 위성 궤도력 해 유형
static − static 처리기 제어를 보여줌.	기선 최소 관측 시간 고정해가 가능한 최대 기선 길이 � 두 가지 설정을 보여줌. (방송 궤도력 사용을 위한 설정 및 정밀 궤도력 사용을 위한 설정).
kinematic − kinematic 처리기 제어를 보여줌.	최소 기준 관측 시간 Static 초기화 최소 관측 시간 알려진 측점 최소 초기화율 최소 OTF 처리 시간
글로벌 − [글로벌 설정] 탭에서 만든 글로벌 설정을 보여줌.	주파수 종류 조정 가능한 최대 사이클 슬립 (static 처리만) 최대 반복 연산수 (static 처리만)  최대 정수 검색 시간 (static 처리만)
질	RMS 수용 기준 비율 수용 기준 기준 분산 수용 기준 편집 승수
대류권	모델 최소 천정 지연 간격 기상 관측 데이터 이용
전리층	모호 정수 결정 통과 (static 처리만) 최종 통과
이벤트	보간법 적용 포인트 갯수 유실 에포크의 최대 허용 갯수 시간 옵셋 참조:등록 정보 창에서도이벤트 데이터를 볼 수 있음.
OTF 검색 � On-The-Fly 검색에 사용된 방법을 보여줌.


    GPS 기선 처리 보고서 - 추적 요약

기선 처리 보고서에는 각 포인트로부터의 [위성 추적 요약]과 [결합 추적 요약]이 포함되어 있습니다.

[추적 요약] 섹션을 보려면:

1.	보고서 \ GPS 기선 처리 보고서를 선택합니다. GPS 기선 처리 보고서가 나타납니다.

2.	처리 요약으로부터 원하는 기선을 선택합니다. [기선 요약]이 나타납니다.

3.	내용으로부터 [추적요약]을 선택합니다.

개별 추적 요약

이 요약은 각 위성으로부터 수신되는  L1 및 L2 신호의 추적의 질을 설명해 줍니다.

위성 추적 요약을 살펴보면 베이스와 로버 측점에서 위성 추적이 연속되는 것을 알 수 있습니다. 이 요약에서는 관측 세션 동안 각 측점의 각 위성에 대한 연속 추적을 연속 실선으로 표시합니다.

이 요약은 발생하는 사이클 슬립(위성과 '록' 유지 상태의 단절)의 크기 및 수를 결정할 때 사용합니다. 사이클 슬립은 위성 데이터의 전송 중단을 의미하는 간격으로 표시됩니다. 사이클 슬립 후에 나타나는 체크 표는 수신기가 언제 다시 위성 신호를 수신하게 되는지를 알려 줍니다.

결합 추적 요약

기선 처리에서는 동일 위성을 각 측점으로부터 동시에 추적하는 것을 전제로 하기 때문에 GPS 기선 처리 보고서에는 결합 추적의 화면 출력도 포함되어 있습니다.

처리에 사용된 세그먼트들은 신호를 둘러싸고 있는 회색 사각형들의 형태로 나타납니다. 처리된 위상 세그먼트에서의 간격은 기선 처리기가 기선을 처리할 때 해당 데이터 세그먼트를 사용하지 않았음을 보여주는 것입니다.


    GPS 기선 처리 보고서 - 연속 Kinematic 질

추가 정보

방법 ...	보고서	기타
이 섹션은 연속 Kinematic 데이터를 처리한 경우에만 보고서에 나타납니다. 연속 Kinematic 데이터 섹션은 두 개의 플롯을 포함합니다.

[연속 Kinematic 질]의 정보를 보려면:

1.	보고서 \ GPS 기선 처리 보고서를 선택합니다. GPS 기선 처리 보고서가 나타납니다.

2.	처리 요약으로부터 원하는 기선을 선택합니다. [기선 요약]이 나타납니다.

3.	내용으로부터 [연속 kinematic 질]을 선택합니다.

첫 번 째는 시간의 변화에 따라 도면에 나타나는 각 연속 Kinematic 기선에 대한RMS의 플롯입니다. 이것은 잘못된 결과가 나올 수 있는 시기를 알아내는 데 사용됩니다. 시간의 흐름에 따라 RMS의 수치가 지속적으로 증가했으면 처리 중에 문제가 발생했었을 지도 모른다는 것을 시사합니다.

두 번 째는 시간의 변화에 따라 나타나는 위성의 수와RDOP의 플롯입니다. 이 플롯은 잘못된 위성 기하 와 이로 인해 잘못된 처리 결과가 있었을 시기를 알아내는 데 사용됩니다.


    GPS 기선 처리 보고서 - 잔차

잔차 플롯은 기선 해에서 사용된 각 위성에 대한 관측 잔차를 그래프로 나타낸 것입니다.

잔차 플롯은 각 위성으로부터 수신된 데이터의 질을 나타냅니다. 이 플롯을 이용하여 해에서의 잡음의 양을 개략적으로 파악할 수 있습니다. 이 플롯은 매 측정 사이클에 대한 개별 위성의 잔차를 보여줍니다. 잡음이 많은 위성은 다른 위성으로부터 오는 데이터에 영향을 미칠 수도 있습니다. 그래프의 선들은 0(zero) 근처에 밀집되어야 합니다. 플롯이 0으로부터 얼마나 멀리 분산되어 있느냐가 해의 잡음의 양을 나타냅니다.

처리기가 이중 차(double differencing)의 베이스로 선택한 위성에 대한 잔차는 나타나지 않습니다. 긴 선점의 경우에는 이러한 목적으로 처리기가 두 개 이상의 위성을 선택할 수 있습니다. 잔차 플롯에서 간격은 해당 기간 동안 그 위성이 이중 차를 위한 베이스로 사용되었음을 보여줍니다.


    L1 Only 와 [전리층 무영향 해]의 비교

전리층 무영향 고정 해는 광범위한 여러 조건 하에서 최적의 해입니다. 이 해는 아무런 전리층 편기(bias)도 가지고 있지 않으며, 고정 모호성은 전체적으로 최상의 결과를 가져다 줍니다.

그러나 짧은 기선 상의 전리층 무영향 고정 해는 신뢰성이 떨어지는 해가 될 수 있습니다. 따라서 짧은 기선에서는 이러한 해의 사용을 피하시기 바랍니다. Trimble Geomatics Office 소프트웨어는 자동으로 짧은 기선을 식별하고 알맞은 최종 해 유형을 선택합니다.

30 km이상 되는 기선 상의 전리층 무영향 유동 해는 상당히 좋은 해일 수 있지만 반드시 내용을 확인하여야 합니다. 매우 긴 기선 상에서는 전리층 무영향 유동 해가 얻을 수 있는 최적의 해일 수 있습니다. 더 긴 선점 시간은 더 나은 전리층 무영향 유동 해를 가져다 줍니다. 이는 편기(bias)가 없는 전리층 무영향 관측량으로 인해 해가 정확한 기하학적 결과에 수렴하기 때문입니다. 실제로 매우 긴 기선 상의 전리층 무영향 유동 해를 수 시간 동안 선점할 경우 매우 훌륭한 결과를 얻을 수 있습니다.

5km 이하의 매우 짧은 기선의 경우, 보통은 이중 주파수 모호성에서 유도된 L1-only 최종 패스가 최종 해가 됩니다. 매우 긴 기선의 경우(방송 궤도력을 사용하는 200km 이상, 정밀 궤도력을 사용하는 2000km 이상의 경우)에는, 전리층 무영향 유동 최종 패스가 다음에 보는 바와 같이 최종 해가 될 수 있습니다:

매우 짧은 기선

수 km 길이의 짧은 기선의 경우에는 전리층 무영향  고정 대신에 L1-only 최종 패스가 만들어 집니다. 하지만 이 최종 L1-only 해는 L1 모호성을 도출하기 위해서 이중 주파수 데이터를 사용하여 만듭니다.  5 km 이하 영역의 기선에서는 일반적으로 L1 고정 해가 잡음이 적다는 이유로 선호됩니다.

L1-only 해의 차단 값은GPS 처리 스타일을 사용하여 설정합니다.

매우 긴 기선

수 백 km에서 수 천 km의 매우 긴 기선의 경우에는 이중 주파수 데이터를 사용하여 전리층 무영향 유동 해를 만들기 위해 유동 해 유형을 선택합니다. 앞에서 언급한 것처럼 매우 긴 기선 상에서 선점 시간이 길면 매우 훌륭한 전리층 무영향 유동 해를 얻을 수 있습니다.

매우 긴 기선에서 유동 해를 차단하기 위해 사용되는 값은GPS 처리 스타일에서 설정할 수 있습니다. 방송 궤도력과 정밀 궤도력의 사용을 위해서 별도의 기준을 설정할 수 있습니다.


    유동 해

추가 정보

방법 ...	보고서	기타
단일 주파수 데이터를 처리할 때 기선 처리기는 L1 모호성이 원활히 정해질 수 있는 경우 L1 고정 최종 통과 해를 만들어 냅니다. 하지만 L1 검색이 원활하지 않았다 하더라도 L1 유동 해는 만들어집니다. 매우 짧은 기선에 대한 L1 유동 해는 선점이 너무 짧았을 경우나, 관측 잡음이 이례적으로 심할 때 나타날 수 있습니다. 10 내지 15 km 이상의 기선의 경우에는, 단일 주파수 관측치가 전리층 지연에 대해 민감하기 때문에 신뢰할만한 L1 고정 해를 얻기가 점점 어려워 질 수 있습니다.

L1 유동 해는 일반적으로 고정 정수 해보다 신뢰도가 떨어집니다. 따라서 표준 측량 응용 프로그램에 L1 유동 해는 사용하지 않기를 권장합니다. 데이터를 재처리하거나 작업현장에서 이 기선들을 재관측하는 것이 바람직합니다.

고정 정수 해를 만드는 결정은 기선 처리기에 의해 내부적으로 지정된 비율 차단에 의해 제어됩니다. 차단 값은 1.5로 되어 있고 계산된 비율이 이 차단 값보다 작을 경우에 유동 해가 만들어집니다.


    [GPS 기선 처리 보고서 설정] 대화 상자

추가 정보

방법 ...	기타
이 대화 상자는 GPS 기선 처리 보고서에 나타나는 섹션들을 선택하고자 할 때 사용합니다.

이 기능을 이용하려면, 다음 중 하나의 방법을 사용합니다:

  보고서 / 설정 / GPS 기선 처리 보고서를 선택합니다.

  Alt+RSO를 누릅니다.

[GPS 기선 처리 보고서 설정] 대화 상자가 나타납니다.

다음과 같은 보고서 섹션들을 추가하거나 삭제하고자 할 경우에는 체크 표시 난에 그 선택 여부를 표시합니다:

  기선 요약

  기선 구성요소

  선점

  처리 스타일

  결합 추적 요약

  연속 Kinematic 질

  잔차


    Trimble 데이터 컬렉터 (*.dc) 파일

이 파일에는 통상적으로 실시간 kinematic (RTK) 측량이나 광파 측량의 정보가 들어 있습니다. Trimble 데이터 컬렉터 파일은 무선 통신이 불가능할 때 사후 처리에 사용되는 GPS 측정치를 참조하기 위해 사용됩니다. 이 경우 포인트 정보는 데이터 컬렉터 파일에,  그리고 원시 GPS 측정치는 관련된 .dat 파일에 사후 처리용으로 저장됩니다. 데이터 컬렉터 파일이 참조하는 GPS 측정치는 Trimble Geomatics Office 소프트웨어의 기선 처리기에 의해 사용되며, 실시간에서 처리할 수 없었던 기선을 계산하는 데 사용됩니다.

GPS 측정치들은 별도의 .dat 파일에 저장되지만, 데이터 컬렉터 파일 자체의 참조 내용 때문에 가져오기를 수행할 때 자동으로 로드 되며, 이들을 독립된 파일로 로드 할 필요가 없습니다.

데이터 컬렉터 파일에는 각각 다른 측량 방법으로 여러 차례에 걸쳐 수집한 측정치들이 있을 수 있습니다.


    Trimble 수신기 (*.dat) 파일

이 파일에는 Trimble GPS 수신기로 수집한 측정치가 들어있습니다. 이 파일은 통상적으로 수신기 메모리 보드나 Trimble 데이터 컬렉터의 메모리 카드에 기록됩니다. 이 파일은 처리를 위해 측량 기기에서 Trimble Geomatics Office 소프트웨어로 다운로드 됩니다. 이 파일에 들어있는 측정치들은 기선 처리기로 기선을 계산할 때 사용되며 Static, FastStatic 및 Kinematic기법을 이용합니다.


    기타 수신기 제조업체 (RINEX) 파일

추가 정보

 기타

이 파일에는 GPS 수신기로 수집한 측정치들이 들어있습니다. 이 파일은 내용상 .dat 파일과 비슷하지만, RINEX 포맷으로 저장됩니다. RINEX 포맷은 수신기로 수집한 GPS 데이터를 ASCII 코드로 나타낸 것입니다. RINEX 파일에는 관측 데이터,항법 데이터 및 기상 데이터가 들어 있습니다.

RINEX 파일은 일반적으로 IGS Tracking Network, 미국의 Continuously Operating Reference Stations(CORS)과 같은 기지국에서 구하거나, 기타 제조업체의 소프트웨어에서 구합니다. 기선 처리기는 이 파일들을 .dat 파일과 같은 방법으로 사용하여 벡터 기선 해를 구합니다.


    Static/FastStatic GPS 데이터

추가 정보

 기타

Static 측량 세션에서 수집한 데이터와 FastStatic 측량 세션에서 수집한 데이터 간에는 다음과 같은 차이가 있습니다.

Static 측량 세션에서는 수신기가 다음과 같을 것으로 간주합니다:

  단일 포인트 위에 정지해 있습니다.

  데이터를 수집하는 시간이 FastStatic 보다 깁니다.

FastStatic 측량 세션에서는 수신기가 다음과 같을 것으로 간주합니다:

  여러 포인트로 이동하고, 각 포인트에서 데이터를 수집할 동안에는 정지해 있습니다.

  수신기가 포인트 간을 이동하는 동안에는 데이터를 수집하지 않습니다.

  데이터를 수집하는 시간이 static 세션보다 짧습니다.

Static과 FastStatic 간의 가장 중요한 차이는 수신기가 데이터를 기록하는 데 걸리는 최소 시간 (점유 시간 )입니다. 이 시간은 응용 소프트웨어, 기선 의 길이, 사용 중인 수신기(1 주파 혹은 2 주파 수신기)의 종류에 따라 달라집니다.

[Static 점유 시간]은 짧게는 30분에서, 최고의 정밀도와 반복성을 요하는 응용 소프트웨어의 경우에는 수 시간 이상이 걸릴 수도 있습니다. [FastStatic 점유 시간]은 2 주파 수신기로 측량할 경우 대략 8분 정도 걸리지만, 지역적 조건에 따라 그보다 더 오래 걸릴 수도 있습니다.

일반적으로, 기선이 길수록 점유 시간이 더 소요됩니다. 점유 시간이 증가함에 따라, 계산 결과의 신뢰도도 증가합니다. 측점에 머무는 시간은 위성군에 따라 다릅니다. 이용 위성 수가 늘어나면 점유 시간은 줄어듭니다. 점유 시간은 또한 관측되고 있는 기선의 길이에 따라 다릅니다. 위성군에 상관없이, 일반적으로 기선이 길수록 점유 시간도 길게 소요됩니다.

[Static 측량법]과 [FastStatic 측량법]을 함께 사용하면 최대의 GPS 정밀도를 얻을 수 있습니다. 사전에 계획을 세워 Static 및 FastStatic 데이터 수집 세션을 서로 연계하여 사용하면 최상의 결과를 얻을 수 있습니다.


    Kinematic 데이터

추가 정보

 기타

Kinematic 측량 세션과 Static 또는 FastStatic 세션의 차이는 데이터가 수집되는 동안 수신기의 이동성 여부에 있습니다; 일반적으로 Kinematic 데이터를 수집할 때는 수신기가 정지 상태에 있지 않습니다.

Kinematic 측량법과 Static/FastStatic 측량법의 또 하나의 중요한 차이는 점유 시간입니다. Kinematic 측량에서 측점 점유 시간은 초기화 후 극적으로 단축됩니다. 사용하는 응용 소프트웨어에 따라 수 분에서 짧게는 수 초에 이릅니다. 이처럼 다수의 데이터 포인트를 짧은 시간 동안에 수집할 수 있기 때문에 측량의 생산성을 높일 수 있습니다.

하지만 이렇게 향상된 생산성에는 한가지 단점이 있습니다: 정밀도가 Static/FastStatic 측량에 비해 떨어지고, 더 짧아진 점유시간으로 인해 다중경로에 보다 취약해 집니다. 이는 수집되는 데이터의 양이 더 적어지기 때문입니다. 이처럼 Kinematic 측량은 정밀도가 떨어지기 때문에 고도의 정밀도를 요하지 않는 GPS 응용 소프트웨어에 한해 사용합니다.

Kinematic 측량에서는 위성과의 록(lock)을 유지하는 상태에서GPS 신호의 미지 모호정수 문제 해결을 위한 초기화가 필요합니다. 측량 응용 소프트웨어에서 요구하는 높은 정밀도를 얻으려면 처리 중에 이 모호성을 반드시 해결해야 합니다.

일단 초기화가 되면 측량 포인트에서 점유시간이 짧아 집니다. Trimble Geomatics Office 소프트웨어는 이 초기화를 나중의 해에도 적용할 수 있습니다. 따라서, 일단 초기화가 되면 새 측위를 확보하는데 충분한 데이터와 점유 시간만 필요합니다.

다음과 같은 네 가지 종류의 초기화가 있습니다:

  알려진 측점 초기화

  Static초기화

  후 처리 OTF 초기화

  재 점유 초기화


    Static 초기화

추가 정보

 기타

Static 초기화의 경우, 로버가 다른 포인트를 점유하는 동안 기지국 수신기는 알려진 기준점을 점유 합니다. 이 때 로버는 통상적인 FastStatic 점유에 소요되는 시간 동안 포인트에서 정지 상태를 유지합니다. 점유시간은 이용 가능한 위성의 수와, 측량에 사용되는 수신기의 종류에 따라 달라집니다. 위성의 가용성과 지역적 상황을 참조하고, 또 FastStatic 점유 권장 시간과 자신의 경험을 참조하시기 바랍니다.


    알려진 측점 초기화

추가 정보

 기타

[알려진 측점 초기화]는 모든 초기화 유형들 중에서 가장 빠르고 가장 신뢰성이 높습니다. 기지국의 수신기와 이동 수신기가 모두 이미 알려져 있거나 이전에 측량했던 포인트에 설치되고, 로버는 그 포인트에서 최소한 30초 동안 정지 상태를 유지합니다. 기선 처리기는 초기화 중에 알려진 이 좌표를 추가 정보로 사용합니다.


    후 처리 OTF 초기화

추가 정보

 기타

[OTF 초기화]를 하려면 다섯 개의 위성과 록(lock)을 유지해야 합니다. 기지국 수신기는 알려진 포인트에 위치하면서 GPS 측정치를 수집합니다. 로버도 같은 시간 동안 측정치를 수집하지만, 로버는 어떤 포인트에서 일정 시간 정지 상태를 유지할 필요가 없습니다. 데이터를 수집하는 기간 내내 로버가 이동했다 하더라도 기선처리기는 이 데이터를 이용하여 초기화할 수 있습니다.


    재 점유 초기화

추가 정보

 기타

[재 점유 초기화]는 [알려진 측점 초기화]와 유사합니다. 다른 점은 로버가 점유하는 포인트가 사전에 알려지지 않는 다는 것입니다. 로버는 동일한 kinematic 필드 세션에서 이전에 점유했던 포인트를 점유합니다. 이전에 점유한 바 있는 동일한 포인트에 대해, 기지로부터 로버까지의 기선을 기선처리기가 처리할 수 있을 것이라는 가정을 전제로 합니다. 만약 이 가정이 사실로 입증되면, 해당 [이전 기선 해]는 차후의 다른 초기화에도 사용될 수 있습니다. 이 때 로버는 이전에 점유 되었던 측점 위에서 최소한 30초 동안 정지 상태를 유지해야 합니다.


    이동 및 연속 Kinematic 데이터

추가 정보

 기타

연속 Kinematic 측량으로는 다음과 같은 작업을 할 수 있습니다:

  측면도, 단면도 및 윤곽과 같은 지형적 특성을 도면으로 표시할 수 있습니다.

  비행기나 배와 같은 이동체의 경로를 도면으로 표시하고, 카메라의 셔터 개폐와 같은 순간적인 이벤트의 좌표를 정할 수 있습니다. 수신기 이벤트 포트에 신호를 보내면 수신기에서 이벤트가 생성되고, 이어 이벤트 표시자가 저장됩니다.

연속kinematic 측량은 Stop & Go Kinematic 측량과 동일한 제약 조건들을 가집니다. 그러나 연속 Kinematic 측량에서는, 수신기의 위치가 정지 상태에 있을 때 뿐만 아니라, 로버가 이동 중에 측정한 각 GPS 관측도 기선 처리기로 처리할 수 있습니다. 예를 들어, 안테나 높이에 유의하면서 한 프로젝트 영역에서 데이터를 연속적으로 기록 하는 지형 측량을 할 수 있습니다.

연속 Kinematic 측량에서는 매 에포크 마다 수신기의 위치를 알려주므로, 이 기법을 이용하여 이벤트 표시의 경우에서와 같이 어떤 특정 시점의 수신기의 위치를 알아낼 수 있습니다. 이를 위해 기선 처리기는, 보간법 전략과 이벤트의 한 쪽에 있는 하나 이상의 위치를 사용하여 특정 시점의 수신기의 위치를 결정합니다. 다음 방법을 이용하여 이벤트 보간법 제어를 위한 GPS 처리 스타일을 사용할 수 있습니다:

  보간법

  유실 에포크의 최대 허용 갯수

  시간 옵셋

NOTE: 기선 처리기는 모든 연속 포인트에 포인트 명을 자동으로 할당합니다. 다만 RTK 연속 기술을 사용하여 얻은 포인트와 상충되지 않도록 해야 합니다.


   [새 플롯] 명령 (위성 플롯)

추가 정보

 기타

새 [위성 플롯] 창을 열기 위해서 이 명령을 선택합니다. 여러 개의 [위성 플롯] 창을 불러와서, 바둑판식 혹은 계단식으로 배열할 수 있습니다. 각각의 [위성 플롯] 창을 개별적으로 최소화 할 수도 있고 아이콘들을 [위성 플롯] 고객 영역 내에 정렬할 수도 있습니다.

이 명령을 이용하려면, [GPS 신호 플롯] 창에서 다음 중 하나의 방법을 사용합니다.

 파일 / 새 플롯을 선택합니다.

 [위성 플롯] 도구모음에서, [image] 을 클릭합니다.

새 고객 창이 나타나면, 이 창을 이용해서 추가 플롯을 표시 할 수 있습니다.


   [내 보내기] 명령 (위성 플롯)

추가 정보

 기타 also

현재 플롯의 원시 위성 추적 데이터를 파일로 내 보내기 위해서 이 명령을 선택합니다. 파일의 데이터 테이블에는 활성 플롯에 있는 원시 위성 추적 정보의 각 유형마다 하나의 열이 있습니다.

이 명령을 이용하려면, [GPS 신호 플롯] 창에서 다음 중 하나의 방법을 사용합니다.

 파일 / 내 보내기를 선택합니다.

 [위성 플롯] 도구모음에서, [image] 을 클릭합니다.

송출된 [위성 플롯] 파일은 텍스트 파일에 저장됩니다 (*.txt 파일).


   [인쇄] 명령 (위성 플롯)

추가 정보

 기타

현재 선택된 [위성 플롯] 창에 표시된 플롯을 인쇄하기 위해서 이 명령을 선택합니다. 이 플롯은 [인쇄] 대화상자에서 선택한 옵션에 따라 프린터나 파일로 출력될 수 있습니다.

이 명령을 이용하려면, [GPS 신호 플롯] 창에서 다음 중 하나의 방법을 사용합니다.

 파일 / 인쇄를 선택합니다.

 [위성 플롯] 도구모음에서, [image] 을 클릭합니다.

인쇄 옵션을 선택할 수 있는 [인쇄] 대화상자가 나타납니다.

다음 옵션을 고려할 수 있습니다:

 현재 창에서 [세로] 방향 모드로 바로 인쇄하려면 확인 을 클릭합니다.

 플롯을 90도 회전하여 인쇄하려면 [가로] 방향 옵션을 선택합니다.

 현재 창의 플롯을 프린터 파일로 저장하려면 [파일] 옵션을 선택합니다. [파일] 옵션을 선택하고 확인을 클릭하면, 파일 이름을 요구하는 대화상자가 나타납니다.

 플롯을 만들기 위해 사용했던 원시 위성 정보를 [내 보내기] 명령을 이용해서 파일에 저장할 수도 있습니다. 이는 원시 위성 추적 정보를 표 형식으로 작성할 때 유용합니다. 나중에 송출된 표 형식의 정보와 보고서의 플롯을 결합할 수도 있습니다.


   [위성 플롯 도움말] 명령 (위성 플롯)

추가 정보

 기타

[위성 플롯] 명령과 명령의 수행에 관한 도움말 정보를 보기 위해서 이 명령을 선택합니다.

이 명령을 이용하려면, [GPS 신호 플롯] 창에서 다음 중 하나의 방법을 사용합니다.

 도움말 / 위성 플롯 도움말을 선택합니다.

 [위성 플롯] 도구모음에서, [image] 을 클릭합니다. .

[위성 플롯] 도움말이 나타납니다.


   [L1 신호거리] 명령 (위성 플롯)

추가 정보

방법…	기타
Timeline의 타임 스팬에 선택된 위성의 [L1 신호거리](S-Range) 데이터를 미터로 플롯하기 위해서 이 명령을 선택합니다.

이 명령을 이용하려면, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / L1 신호거리를 선택합니다.

 대화상자 표시줄에서 L1 신호 거리 단추를 클릭합니다.

[L1 신호거리] 정보가 현재 창에 플롯 됩니다.


   [방위각] 명령 (위성 플롯 )

추가 정보

방법...	기타
Timeline의 타임스팬에 선택된 위성의 수집된 방위각 데이터를 각도로 플롯하기 위해서 이 명령을 선택합니다.

[방위각] 플롯을 보려면, 다음 중 한가지 방법을 이용합니다:

 보기 / 데이터 / 방위각을 선택합니다.

 대화상자 표시줄에서 방위각 단추를 클릭합니다.


   [앙각] 명령 (위성 플롯)

추가 정보

방법...	기타
원시 위성 앙각 정보를 플롯하기 위해서 이 명령을 선택합니다. 데이터가 Timeline의 타임 스팬에 각도로 플롯됩니다.

[앙각] 플롯을 보기위해서, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / 앙각을 선택합니다.

 대화상자 표시줄에서 앙각 단추를 클릭합니다.

앙각 데이터가 현재 창에 플롯됩니다.


   [L1 SNR] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline의 타임스팬에 선택된 위성의 수집된 L1 반송파 신호 대 잡음 비율(SNR) 데이터를 플롯하기 위해서 이 명령을 선택합니다.

[L1 SNR] 플롯을 보기위해서, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / L1 SNR을 선택합니다.

 대화상자 표시줄에서 L1 SNR단추를 클릭합니다.

L1 신호 대 잡음 비율 정보가 현재 창에 플롯됩니다.


   [L2 SNR] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline의 타임스팬에 선택된 위성의 수집된 L2 반송파 신호 대 잡음 비율 데이터를 플롯하기 위해 이 명령을 선택합니다.

이 명령을 이용하려면, [GPS 신호 플롯] 창에서 다음 중 하나를 실행합니다:

 보기 / 데이터 / L2 SNR를 선택합니다.

 대화상자 표시줄에서 L2 SNR단추를 클릭합니다.

SNR 정보가 현재 창에 플롯됩니다.


   [L1 위상] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline 의 타임스팬에 선택된 위성의 수집된 L1 반송파 위상 데이터를 플롯하기 위해서 이 명령을 선택합니다.

[L1 위상] 플롯을 보려면 다음 중 하나의 방법을 이용합니다:

w",0,`',`')} 보기 / 데이터 / L1 위상을 선택합니다.

 대화상자 도구모음에서 L1 위상 단추를 클릭합니다.

[L1 위상] 정보가 현재 창에 플롯됩니다.


   [L2 위상] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline의 타임스팬에 선택된 위성의 L2 반송파 위상 데이터를 플롯하기 위해 이 명령을 선택합니다.

[L2 위상] 플롯을 보려면, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / L2 위상을 선택합니다.

 대화상자 표시 줄에서 L2 위상 단추를 클릭합니다.

L2 위상 정보가 현재 창에 플롯됩니다.


   [L1 Doppler] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline의 타임스팬에 선택된 위성의 수집된 L1 반송파 Doppler 데이터를 kHz로 표시하기 위해서 이 명령을 선택합니다.

L1 Doppler는 샘플 측정 간격 동안 평균을 낸 명백한 반송파 신호 주파수 옵셋입니다. 이는 명목상의 L1반송파 주파수인 1575.42 MHz와 관계를 지어, 내부 수신기 시계를 기준으로 측정됩니다. L1 도플러는 모든 수신기 및 위성 시계 주파수 오류를 포함합니다. 이는 L1 반송파에서 헤르츠로 표시됩니다.

[L1 Doppler] 플롯을 보기위해서, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / L1 Doppler를 선택합니다.

 대화상자 표시줄에서 L1 Doppler단추를 클릭합니다.

L1 Doppler 정보가 현재 창에 플롯됩니다.


   [ L1 Aux, CA] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline의 타임스팬에 선택된 위성의 수집된 L1 보조 C/A 코드 정보를 플롯하기 위해 이 명령을 선택합니다. 해당 위성에 대한 L1 보조 C/A 정보가 없을 경우에는 이 명령의 메뉴 옵션 또는 대화상자 표시줄 단추를 이용할 수 없습니다. 수신기가 L1 C/A 코드와 L1 P 코드를 둘 다 동시에 추적할 수 있는 경우에만 이 명령을 이용할 수 있습니다.

L1 보조 C/A 코드 정보를 보기 위해서, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / L1 Aux. CA를 선택합니다.

 대화상자 표시 줄에서 L1 Aux. CA 단추를 클릭합니다.

L1 보조 C/A 정보가 현재 창에 플롯됩니다.


   [시계 옵셋] 명령 (위성 플롯)

추가 정보

방법...	기타
Timeline의 타임스팬에 시계 옵셋 정보를 밀리세컨드로 플롯하기 위해 이 명령을 선택합니다.

[시계 옵셋] 플롯을 보려면, 다음 중 하나의 방법을 이용합니다:

 보기 / 데이터 / 시계 옵셋을 선택합니다.

 대화상자 표시 줄에서 시계 옵셋 단추를 클릭합니다.

시계 옵셋 데이터가 현재 창에 플롯됩니다.


   [대화상자 표시 줄] 명령(위성 플롯)

추가 정보

방법...	기타
대화상자 표시 줄을 보이게 하거나 숨기기 위해서 이 명령을 선택합니다. 대화상자 표시 줄에는 원시 위성 추적 정보를 플롯하기 위한 모든 명령이 있습니다.

대화상자 표시 줄을 보이게 하거나 숨기기 위해서:

 보기 / 대화상자 표시줄을 선택합니다.

 Alt+VD키를 누릅니다.

다음의 대화상자 표시줄 단추들을 이용할 수 있습니다:

 방위각

 앙각

 L1 신호 거리

 L1 SNR

 L2 SNR

 L1 위상

 L2 위상

 L1 Doppler

 L1 Aux. CA

 시계 옵셋

참조: 이 단추들은 [위성 플롯] 메뉴 상에 있는 명령과 동일합니다.

팁: 사용자가 대화상자 표시 줄을 분리하여 다른 곳에 붙일 수 있습니다. 대화상자 표시 줄을 분리하여 [위성 플롯] 도구모음 옆에, 또는 상태 표시 줄 하단으로 이동하여 붙일 수 있습니다.


   [도구 모음] 명령(위성 플롯)

추가 정보

 기타

[위성 플롯] 도구모음을 보이게 하거나 숨기기 위해서 이 명령을 선택합니다.

[위성 플롯] 도구모음을 보이게 하거나 숨기기 위해서:

 보기 / 도구모음을 선택합니다.

 Alt+VT 키를 누릅니다.

이 명령을 선택할 때 마다 도구모음이 보이거나 숨겨집니다.


   [데이터] 명령(위성 플롯)

추가 정보

방법...	기타
플롯하는 명령의 서브 메뉴를 표시하기 위해서 이 명령을 선택합니다. 각각의 명령은 특정 유형의 원시 위성 추적 정보를 플롯합니다.

[데이터] 서브 메뉴를 보기위해서는:

iew",0,`',`')} 보기 / 데이터를 선택합니다.

다음의 하위 명령들을 가진 서브 메뉴가 나타납니다:

 방위각

 앙각

 L1 신호 거리

 L1 SNR

 L2 SNR

 L1 위상

 L2 위상

 L1 Doppler

 L1 Aux. CA

 시계 옵셋

참조: 이 명령들은 [위성플롯] 대화상자 에 있는 단추들과 동일합니다.


   [종료] 명령 (위성 플롯)

추가 정보

 기타

[위성 플롯]을 보는 중 세션을 종료하려면 이 명령을 선택합니다.

[종료] 명령을 선택하려면 다음 중 하나의 방법을 이용합니다:

 파일 / 종료를 선택합니다.

[위성 플롯] 창이 닫힙니다.


   [도움말 사용하기] 명령 (위성 플롯)

추가 정보

 기타

도움말 사용에 관한 윈도우 도움말 시스템을 불러오기 위해 이 명령을 선택합니다.

도움말 사용에 관한 윈도우 도움말 시스템을 불러오려면 다음 중 하나의 방법을 이용합니다:

 도움말 / 도움말 사용하기를 선택합니다.

[도움말 사용하기] 윈도우 도움말 시스템이 나타납니다.


   [색인] 명령 (위성 플롯)

Trimble Geomatics Office 소프트웨어의 도움말 시스템을 시작하기 위해서 이 명령을 선택합니다.

Trimble Geomatics Office 도움말을 보려면, 다음 중 하나의 방법을 이용합니다:

 도움말 / 색인을 선택합니다.

도움말 시스템의 항목색인이 나타납니다.


     플롯 인쇄

플롯의 그래픽 이미지는 프린터 또는 프린터 파일로 출력할 수 있습니다.

플롯은 기본값으로 세로 방향 모드로 인쇄되도록 설정되어 있습니다. [프린터 설정] 대화 상자에서 가로 방향 모드를 선택하여 플롯을 90도 회전시켜 인쇄 할 수 있습니다.

팁: 플롯과 관련된 위성 추적 데이터 내보내기를 이용하여 데이터를 파일로 출력한 후 텍스트 편집기에서 그 파일을 연 다음 데이터를 인쇄할 수 있습니다. 이 기능은 파일로 출력된 플롯을 문서화 하는데 유용합니다.


     플롯 데이터 내보내기

플로팅 된 여러 개의 위성 추적 데이터를 플롯 창에 표시 할 뿐만 아니라 이를 파일로 출력할 수도 있습니다.

다음은 L1 및 L2 신호대 잡음비 플롯 데이터를 포함하고 있는 파일의 첫번째 몇 줄을 발췌한 것입니다.

위성 SV 1의 Timeline 위성 데이터를 29932370.DAT파일로 내보내기

시간                       	       L1 S/N   L2 S/N

14:05:25.0  1998/09/10       52.75     38.00

14:05:30.0  1998/09/10       52.25     38.50

참조: 동일한 플롯 창에 더 많은 데이터 형식을 포함시킬 경우, 출력 파일에 열이 추가됩니다.


     플롯 분석

추가 정보

 기타

하나 또는 그 이상의 위성 플롯 창에 표시되는 위성 추적 플롯을 눈으로 분석하여 모순된 데이터를 찾을  수 있습니다. 이 기능은 하나 또는 그 이상의 위성을 추적하는 동안 수신기가 가질 수 있는 문제를 찾아내는데 유용합니다. 어떤 경우에는 하나 또는 그 이상의 위성으로부터의 관측치를 전부 또는 일부를 '불이용' 상태로 만드는 것이 도움이 될 수 도 있습니다.


     위성 플롯 표시

추가 정보

 기타

수집된 위성 추적 데이터의 플롯은 메뉴 또는 [대화 상자 표시줄] 명령을 사용하여 표시할 수 있습니다.

플롯 보기를 하는 동안 다음 사항을 실행할 수 있습니다:

  동일 창 내에 여러 형식의 수집된 위성 추적 데이터 표시.

  여러 개의 창 열기. 각 창은 하나 또는 그 이상의 수집된 위성 추적 데이터 형식을 표시합니다.

  마우스를 사용하여 플롯의 데이터 영역을 지정한 다음 상태 표시줄 표시기에서 데이터 값과 데이터 수집 시간 읽기.

  모순된 데이터를 찾기 위해 두개 또는 그 이상의 수집된 추적 데이터 형식을 눈으로 보면서 분석하기.

  창의 바둑판식 및 계단식 배열.

  창의 최소화 및 최대화.

  최소화된 윈도우 아이콘 배열.

  표준 윈도우 명령을 사용하여 창의 크기 조정, 이동, 이전 크기로 변경.

  아무 때나 고객 창 닫기.

  위성 플롯 창의 최소화 및 최대화. 최소화 되었을 때는 윈도우의 작업 표시줄에 아이콘이 나타납니다.


     위성 플롯 - 개요

Timeline에서 선택된 위성의 원시 위성 추적 정보 플롯을 분석하려면 위성 플롯 보기를 이용합니다.

일반 윈도우 응용 프로그램처럼 프로그램 창의 최소화, 최대화, 또는 닫기를 할 수 있습니다. 위성 플롯을 최소화 시키면 그 아이콘이 윈도우 작업 표시줄에 표시됩니다.

동시에 하나 또는 그 이상의 원시 위성 추적 정보 형식을 창에 플로팅 할 수 있습니다. 그리고 관측 스팬 동안 수집된 원시 위성 데이터를 분석하는 분석 도구로서 이 플롯을 이용할 수 있습니다.

데이터가 표시될 때 이 플롯이 활성화 됩니다. 마우스를 플롯 위로 이동하면서 데이터 값과 데이터 수집 시간을 읽을 수 있습니다. 플롯 상의 마우스 커서의 위치에 따라 상태 표시줄 표시기에 해당 데이터 값과 시간이 달라집니다.

위성 플롯에 대한 추가 정보는 다음 항목을 참조하시기 바랍니다:

  위성 플롯 창

  [위성 플롯] 명령

위성 플롯 창에서 다음과 같은 작업을 할 수 있습니다:

  플롯 표시

  플롯 분석

  플롯 데이터 내보내기

  플롯 인쇄


     위성 플롯 명령 - 개요

모든 위성 플롯 명령은 메뉴에서 이용할 수 있습니다. 몇 가지 명령은 도구 모음과 대화 상자 표시줄에서도 이용할 수 있습니다. 많은 명령의 경우 키보드 바로 가기를 가지고 있습니다.

GPS 신호 플롯 창에서 다음의 명령들을 이용할 수 있습니다:

파일 명령

  새 플롯

  내보내기�

  인쇄�

  인쇄 설정

  종료

보기 명령

  데이터

  도구 모음

  대화 상자 표시줄

창 명령

  계단식 배열

  바둑판식 배열

  아이콘 정렬

도움말 명령

  위성 플롯 도움말

  색인

  도움말 사용하기

  Timeline 정보


     위성 플롯 창 - 개요

추가 정보

대화 상자	기타
개요

관측하는 동안 수집한 원시 위성 추적 정보를 보고 분석하기 위해 위성 플롯 창을 사용합니다. 또한 선택한 위성과 대상 측량의 타임 스팬을 관찰하고 분석하는 도구도 됩니다. 위성 플롯은 자체 메뉴를 가지고 있으며, 상태 표시줄, 도구 모음, 대화 상자 표시줄 및 플롯 창들을 가지고 있습니다. 별개의 개별 위성 추적 플롯을 가지고 있는 복수의 플롯 창을 화면에 출력하고, 창을 최소화 또는 최대화 할 수 있습니다. 표준 창 명령을 사용하여 창의 크기를 재 조정하거나 이전 크기로 변경 또는 이동할 수 있습니다.

플롯 인쇄 및 플롯 데이터 내보내기 명령 등 많은 위성 플롯 명령을 이용할 수 있습니다.

추가 정보는 다음 항목을 참조하시기 바랍니다:

  위성 플롯 메뉴

  위성 플롯 상태 표시줄

  위성 플롯 도구 모음

  위성 플롯 대화 상자 표시줄

  위성 플롯 창


     위성 플롯 창

추가 정보

 기타

하나의 창에 여러 개의 위성 플롯을 불러올 수도 있고, 하나의 플롯에서 새 창을 열어 서로 다른 내용의 플롯을 볼 수도 있습니다.

다음과 같은 지침을 참고하시기 바랍니다:

  하나의 플롯에서 새 창을 열 수도 있고, 여러 개의 위성 플롯을 동일 창에 불러 올 수도 있습니다.

  창 또는 제어 메뉴에서 명령을 선택하여 창을 최소화, 최대화, 닫기, 이전 크기로 조정하기 및 크기 재조정 등을 할 수 있습니다.

  [창] 명령은 창을 계단식 또는 바둑판식으로 배열하거나, 창 아이콘을 정렬할 때 사용할 수 있습니다.

  활성 창의 플롯을 프린터나 파일로 인쇄할 수 있습니다.

  플롯을 만드는데 사용된 데이터를 표 형식의 파일로 출력할 수도 있습니다. 이 파일은 추후에 텍스트 편집기를 사용하여 인쇄할 수 있습니다.


     위성 플롯 [메뉴]

 개요 및 추가 정보

원시 위성 추적 데이터 플롯의 보기, 인쇄하기, 또는 내보내기 명령을 실행하려면 이 메뉴를 사용합니다.

모든 [위성 플롯] 명령은 이 메뉴에서 이용할 수 있습니다. 몇 가지 명령은 도구 모음이나 대화 상자 표시줄에서도 선택할 수 있습니다. 많은 명령이 키보드 바로 가기를 가지고 있습니다.

[GPS 신호 플롯] 창에서 다음의 명령들을 이용할 수 있습니다:

파일 명령

  새 플롯

  내보내기�

  인쇄�

  인쇄 설정

  종료

보기 명령

  데이터

  도구 모음

  대화 상자 표시줄

창 명령

  계단식 배열

  바둑판식 배열

  아이콘 정열

도움말 명령

  위성 플롯 도움말

  색인

  도움말 사용하기


     위성 플롯 [도구 모음]

 개요 및 추가 정보

새 플롯 창 열기, 데이터 내보내기, 플롯 인쇄, 도움말 표시를 실행하려면 이 도구 모음을 사용합니다.

다음 명령들을 이용할 수 있습니다:

	새 플롯 창
	파일로 데이터 내보내기
	플롯 인쇄


     위성 플롯 [상태 표시줄]

 개요 및 추가 정보

이 상태 표시줄은 창에서 마우스 커서가 위치하고 있는 곳의 관측 값과 관측 시간을 보여줍니다.

마우스를 이동하여 관측 타임 스팬 동안 관측치가 기록된 때를 알 수 있습니다.

메시지 표시기 구획

이 구획에 [위성 플롯] 명령 메시지가 표시됩니다. 선택 표시줄이 메뉴 명령 상에 나타나거나 또는 마우스 포인트가 도구 모음이나 대화 상자 표시줄 단추 상에 나타날 때, 명령에 대한 상세한 정보가 이 구획에 표시됩니다.

추적 데이터 표시기 구획

플롯에 표시되는 데이터의 형식과 현재 마우스 위치에 따라 이 구획에 나타나는 값이 달라집니다.

여러 형식의 복수 위성 추적 데이터가 동일 창에 플로팅 되었을 경우 이 표시기는 자동으로 특정 데이터 형식에 적용되는 측정치 단위로 변경됩니다. 플롯 아래에 범례를 통하여 플롯에 표시되는 위성 데이터의 측정치 단위를 알 수 있습니다. 플로팅 된 데이터 위의 현재 마우스 커서 위치에 따라 표시기에 나타나는 측정치 단위가 달라 집니다.

시간 표시기 구획

위성 추적 데이터가 수집된 시간이 이 구획에 표시됩니다. 시간 값은 GPS 주/초 또는 윈도우의 로컬 시간으로 표시됩니다. [시간 옵션] 대화 상자에서 시간 포맷을 변경 할 수 있습니다.


     위성 플롯 [대화 상자 표시줄]

 개요 및 추가 정보

선택된 위성 및 활성 측량에 대해서 관측 기간 동안 수집된 원시 위성 추적 데이터 값을 플로팅 하기 위해 이 대화 상자 표시줄을 사용합니다.

데이터를 플로팅 하려면:

  [대화 상자 표시줄]의 여러 가지 단추를 조합하여 클릭합니다.

마우스를 플롯 상의 관측치 값으로 이동하면 상태 표시줄에 원시 위성 추적 데이터의 관측 값과 관측 시간이 나타납니다.

팁: 이 [대화 상자 표시줄]을 다른 곳에 붙이거나 다시 떼어낼 수 있습니다. 이 대화 상자는 도구 모음의 오른 쪽 지역에 붙이거나 상태 표시줄 아래 부분에 붙일 수 있습니다.

대화 상자 표시줄에는 다음과 같은 단추들이 있습니다:

L1 신호 거리

관측 시간 동안 수집된 추적 L1 정지 거리(미터)를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [L1 신호 거리] 명령을 참조하시기 바랍니다.

방위각

관측 시간 동안 수집된 위성의 추적 방위각 데이터(각)를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [방위각] 명령을 참조하시기 바랍니다.

앙각

관측 시간 동안 위성의 추적된 앙각 데이터(각)를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [앙각] 명령을 참조하시기 바랍니다.

L1 SNR

관측 시간 동안 수집된 추적 L1 반송파 신호대 잡음비 데이터를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [L1 SNR] 명령을 참조하시기 바랍니다.

L2 SNR

관측 시간 동안 수집된 추적 L2 반송파 신호대 잡음비 데이터를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [L2 SNR] 명령을 참조하시기 바랍니다.

L1 위상

관측 시간 동안 수집된 추적 L1 반송파 위상 데이터(사이클)를 플롯 하려면 이 단추를 사용합니다. 추가 정보는 [L1 위상] 명령을 참조하시기 바랍니다.

L2 위상

관측 시간 동안 수집된 추적 L2 반송파 위상 데이터 (사이클)를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [L2 위상] 명령을 참조하시기 바랍니다.

L1 Doppler

관측 시간 동안 추적 L1 Doppler(kHz)를 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [L1 Doppler] 명령을 참조하시기 바랍니다.

L1 Aux C/A

이에 관한 추가 정보는 [L1 Aux. C/A] 명령을 참조하시기 바랍니다.

시계 옵셋

관측 시간 동안의 시계 옵셋(밀리초)을 플로팅 하려면 이 단추를 사용합니다. 추가 정보는 [시계 옵션] 명령을 참조하시기 바랍니다.


   [연속] 명령 (Timeline)

추가 정보

방법. . .	기타
타임 스팬 뷰어에 표시된 연속 세그먼트를 필터하기 위해 이 명령을 선택합니다.

타임 스팬 뷰어에서 연속 세그먼트를 필터하려면:

1. 	타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다.

2. 	보기 필터 / 연속을 선택합니다.

선점 세그먼트HIDTL_Occupation_Objects가 표시되거나 숨겨집니다.

도구모음에서 연속 세그먼트를 필터하려면:

1. 	타임 스팬 뷰어 배경을 클릭합니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.

선점 세그먼트가 표시되거나 숨겨집니다.


   [삭제] 명령 (Timeline)

추가 정보

 기타

Timeline의 측량 혹은 선점 요소를 삭제하기 위해서 이 명령을 선택합니다. 이 Timeline 요소들은 실제 프로젝트의 데이터 내역을 나타내기 때문에, 해당 프로젝트의 모든 관련 데이터도 함께 삭제됩니다.

타임 스팬 뷰어에서 [삭제] 명령을 선택하려면:

1. 	[측량] 혹은 [선점] 요소에 마우스 오른쪽 단추를 클릭합니다.

2. 	[삭제]를 선택합니다.

[측량 보기] 화면에서 [삭제] 명령을 선택하려면:

1. 	[측량] 혹은 [선점] 요소를 클릭합니다.

2. 	다음 중 하나의 방법을 이용합니다:

 [편집 / 삭제]를 선택합니다.

 Del 키를 누릅니다.

해당 요소와 관련된 [측량] 혹은 [선점] 데이터가 삭제되고, 요소의 모양이 검은 테두리가 있는 네모로 바뀌어서 Timeline의 이 위치에 데이터가 있었음을 표시합니다. 삭제된 데이터는 프로젝트에서 제거되므로 더 이상 이용할 수 없습니다.

주의: 프로젝트로부터 [측량] 혹은 [선점] 데이터를 삭제할 때 생기는 영향을 염두에 두시기 바랍니다.


   [DOP 플롯] 명령 (Timeline)

추가정보

 기타

DOP 플롯 표시를 보기 위해서 이 명령을 선택합니다. 이 명령은 타임 스팬 뷰어에서 선점이 선택된 경우에만 이용할 수 있습니다.

 [선점] 메뉴로부터DOP 플롯을 보려면:

1. 	선점 요소에 마우스 오른쪽 단추를 클릭합니다.

2. 	위성 궤도력 정보 / DOP 플롯을 선택합니다.

[DOP 플롯] 표시가 나타납니다.

 [플롯] 도구모음에서 [DOP 플롯]을 보려면:

1. 	선점 요소를 클릭합니다.

2. 	[플롯] 도구모음에서 [image] 을 선택합니다.

[DOP 플롯] 표시가 나타납니다.


   [이용/불이용] 명령 (Timeline)

추가 정보

방법. . .	기타
Timeline 요소를 이용 혹은 불이용 상태로 하기 위해서 이 명령을 선택합니다. Timeline 요소는 실제 프로젝트 데이터 내역을 나타내기 때문에, 해당 데이터도 이용 혹은 불 이용 상태로 됩니다.

이 명령은 특히 기선 해의 질을 높이기 위해 시행착오 테스트를 수행할 때 문제가 있는 데이터를 불이용 상태로 하는데 유용합니다.

이 명령은 또한 다수의 사이클 슬립을 가진 영역과 같은GPS 관측치의 일부영역을 편집할 때도 이용될 수 있습니다.

참조: 위성, GPS 관측치, 및 GPS 관측치의 일부 영역을 이용 그리고 불이용 상태로 할 수 있습니다. 몇몇 Timeline 요소들은 보호되어 있기 때문에 직접 불이용 상태로 할 수 없습니다 � 이 요소들은 모 요소가 불이용 상태로 될 때만 불이용 상태가 될 수 있습니다. 위성궤도력 아이콘 및 스테이션 아이콘등이 이 보호 요소에 속합니다.

타임 스팬 뷰어에서 [이용/불이용] 명령을 선택하려면:

1. 	위성 아이콘 혹은 GPS 관측치 요소를 클릭합니다.

2. 	해당 요소에 마우스 오른쪽 단추를 클릭합니다.

[이용/불이용] 명령을 가진 메뉴가 나타납니다.

하나의 [GPS] 관측치를 선택한 후 [이용/불이용] 명령을 이용하려면:

1. 	마우스를 끌어 해당 GPS 관측치에 선택 직사각형을 그립니다.

2. 	선택 직사각형 내에서 마우스 오른쪽 단추를 클릭합니다.

[이용/불이용] 명령을 가진 메뉴가 나타납니다.

여러 개의 [GPS] 관측치를 선택한 후 [이용/불이용] 명령을 이용하려면:

1.	마우스를 끌어 [GPS 관측치] 요소들을 둘러싼 선택 직사각형을 그립니다.

2. 	해당 선택 직사각형에 마우스 오른쪽 단추를 클릭합니다.

[불이용/이용] 명령을 가진 메뉴가 나타납니다.


   [위성궤도력] 명령 (Timeline)

추가 정보

방법. . .	기타
타임 스팬 뷰어에 표시된 위성궤도력 아이콘을 필터하기 위해서 이 명령을 선택합니다. 이 명령이 실행될 때마다 위성궤도력 아이콘이 표시되거나 숨겨집니다.

타임 스팬 뷰어로부터 위성궤도력 아이콘을 필터하려면:

1. 	타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다.

2. 	[보기 필터]를 선택합니다.

[위성궤도력] 명령을 가진 서브 메뉴가 나타납니다.

도구모음에서 위성궤도력 아이콘을 필터하려면:

1. 	타임 스팬 뷰어 배경을 클릭합니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.


   [위성궤도력 정보] 명령 (Timeline)

추가 정보

방법. . .	기타
선택된 선점에 대한 [DOP 플롯] 및 [하늘플롯]을 볼 수 있는 옵션을 가진 서브메뉴를 보기 위해서 이 명령을 선택합니다.

 [위성궤도력 정보] 서브 메뉴를 보려면:

1. 	[선점] 요소를 선택합니다. 선점이 하이라이트 됩니다.

2. 	선점에 마우스 오른쪽 단추를 클릭합니다.

[위성궤도력 정보] 명령을 가진 메뉴가 나타납니다.

다음의 서브메뉴 명령을 이용할 수 있습니다:

 DOP 플롯

 하늘 플롯

참조: 위의 명령은 [플롯] 도구 모음에서도 이용할 수 있습니다.


   [모두 개방] 명령 (Timeline)

추가 정보

방법. . .	기타
Timeline 제어 표시줄의 모든 데이터 폴더를 열기 위해서 이 명령을 선택합니다.

참조: 하나 이상의 데이터 폴더가 닫혀 있을 때만 이 명령을 이용할 수 있습니다.

제어 표시줄에서 [모두 개방] 명령을 선택하려면:

 제어 표시줄 배경 혹은 데이터 폴더에서 마우스 오른쪽 단추를 클릭합니다. [모두 개방] 명령을 가진 메뉴가 나타납니다.

{Timeline} 도구모음에서 [모두 개방] 명령을 선택하려면:

1. 	제어 표시줄 배경 혹은 데이터 폴더를 클릭합니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.

팁: 또한 데이터 폴더 상의 [image] 을 클릭해서 각각의 데이터 폴더를 개별적으로 개방할 수도 있습니다.


   [다음] 명령 (Timeline)

추가정보

방법. . .	기타
타임 스팬 뷰어를 다음 [측량] 요소로 이동하기 위해서 이 명령을 선택합니다. 타임 스팬 뷰어를 데이터 폴더의 [측량] 요소로 연속적으로 빨리 이동하기 위해서 이 명령을 반복 선택할 수 있습니다.

타임 스팬 뷰어에서 [다음] 명령을 선택하려면:

 타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다. [다음] 명령을 가진 메뉴가 나타납니다.

Timeline 도구모음에서 [다음] 명령을 선택하려면:

1. 	먼저 타임 스팬 뷰어 배경이나 [측량] 요소 혹은 [선점] 요소를 클릭합니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.

팁: 선점 요소로 지정 이동하기 위해서 직접적인 경로를 택할 수도 있습니다. 예를 들어, [측량] 보기에서 기선의 등록정보를 보고, [선택부분] 목록에서 하나의 선점을 선택할 수 있습니다. 이렇게 하면 타임 스팬 뷰어가 선택된 선점으로 직접 이동되고 해당 선점이 하이라이트 됩니다.

팁: 전체보기 명령을 이용해서 전체 Timeline을 볼 수도 있습니다. 원하는 선점을 선택하고 스팬 범위 보기 명령을 이용해서 해당 선점의 스팬 범위를 볼 수도 있습니다.


   [직전배율] 명령 (Timeline)

추가 정보

방법. . .	기타
타임 스팬 뷰어를 직전 선점의 종점으로 이동하기 위해서 이 명령을 선택합니다. 이 명령을 몇 차례 반복하여 타임 스팬 뷰어를 측량 데이터의 각 연속 선점으로 신속하게 이동할 수 있습니다.

타임 스팬 뷰어에서 [직전배율] 명령을 선택하려면:

 타임 스팬 뷰어의 배경이나  측량 요소, 또는 선점 요소에 마우스 오른쪽 단추를 클릭합니다. [직전배율] 명령을 가진 메뉴가 나타납니다.

Timeline 도구모음에서 [직전배율] 명령을 선택하려면:

1. 	타임 스팬 뷰어 배경이나 측량HIDTL_Survey_Object 요소, 또는 선점HIDTL_Occupation_Objects 요소를 클릭합니다.

2.    Timeline 도구모음에서 [image] 을 클릭합니다.

팁: 선점 요소로 이동할 경우 보다 직접적인 방법을 택할 수도 있습니다. 예를 들어, [측량 보기] 창에서 기선의 등록정보를 보고,  [선택부분] 목록에서 선점을 직접 선택할 수 있습니다. 이렇게 하면 타임 스팬 뷰어가 선택된 선점으로 바로 이동되고 해당 선점이 하이라이트 됩니다.

팁: 전체보기 명령을 이용해서 전체 Timeline을 볼 수도 있습니다. 원하는 선점을 선택하고 스팬 범위 보기 명령을 이용해서 해당 선점의 스팬 범위를 볼 수도 있습니다.


   [위성] 명령 (Timeline)

추가 정보

방법. . .	기타
타임 스팬 뷰어에 나타나는 모든GPS 관측치를 필터하기 위해서 이 명령을 선택합니다. 이 명령을 실행할 때 마다 GPS 관측치가 표시되거나 숨겨집니다.

타임 스팬 뷰어에서 GPS 관측치를 필터하려면:

1. 	타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다.

2. 	[보기 필터]를 선택합니다.

[위성] 명령을 가진 서브메뉴가 나타납니다.

Timeline 도구모음에서 GPS 관측치를 필터하려면:

1. 	타임 스팬 뷰어 배경을 클릭합니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.

이 명령이 실행되면 GPS 관측치와 관련된 모든 [위성궤도력] 아이콘이 표시되거나 숨겨집니다.


   [모두 수축] 명령 (Timeline)

추가정보

방법. . .	기타
Timeline 제어 표시줄에 있는 열려진 모든 데이터 폴더를 닫기 위해서 이 명령을 선택합니다.

참조: 이 명령을 이용하기 위해서는 적어도 하나 이상의 폴더가 열려 있어야 합니다.

제어 표시줄에서 [모두 수축] 명령을 선택하려면:

 제어 표시줄의 배경 혹은 데이터 폴더에 마우스 오른쪽 단추를 클릭합니다. [모두 수축] 명령을 가진 메뉴가 나타납니다.

Timeline 도구모음에서 [모두 수축] 명령을 선택하려면:

1. 	제어 표시줄의 배경 혹은 데이터 폴더를 클릭합니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.

팁: 폴더의 [image] 기호를 클릭해서 각 데이터 폴더를 개별적으로 닫을 수도 있습니다.


  [하늘 플롯] 명령 (Timeline)

추가 정보

 기타

하늘플롯을 보기 위해서 이 명령을 선택합니다. 타임 스팬 뷰어에서 선점 요소가 선택되어야만 이 명령을 이용할 수 있습니다. [하늘플롯]은 선점 당시에 선택한 포인트에서 볼 수 있는 위성군의 로컬 수평 플롯을 보여줍니다. 위성의 위치는 관측 당시의 위성 궤도력 정보로부터 계산되고, 방위각 및 앙각으로 표시 됩니다.

선점의 [하늘 플롯]을 보려면:

1.  데이터 폴더를 개방하기 위해서 다음 중 하나의 방법을 이용합니다:

 제어 표시 줄에서 다음 중 하나의 방법을 이용해서 데이터 폴더를 개방합니다.

 데이터 폴더에서 [image] 을 클릭합니다.

 데이터 폴더에 마우스 단추를 클릭하고 [모두 개방]을 선택합니다.

 Timeline 도구모음에서 [image] 을 클릭합니다.

첫 번째 동작은 선택된 데이터 폴더에 속한 위성 아이콘들이 나타나도록 합니다. 두 번째 동작은 모든 데이터 폴더를 개방합니다.

2.  [선점] 요소를 클릭하여 선택합니다.

3.  [하늘 플롯] 명령을 선택하려면, 다음 중 하나의 방법을 이용합니다:

  [선점]에 마우스 오른쪽 단추를 클릭하면 메뉴가 나타나고, 이 메뉴에서 [위성궤도력 정보]를 선택하면 또 하나의 서브메뉴가 나타납니다. 이 서브메뉴에서 [하늘 플롯] 명령을 선택합니다.

  [플롯] 도구 모음에서 [image] 을 클릭합니다.


   [위성 플롯] 명령 (Timeline)

추가 정보

 기타

위성 플롯 화면을 보기 위해서 이 명령을 선택합니다. 위성 플롯에는 선택된 위성 추적 정보를 보거나 인쇄할 수 있는 명령이 있습니다. 이는 각각의 위성에 대한 원시 위성 추적 정보를 분석하는 데도 유용합니다. 이 명령은 제어 표시 줄에서 위성 아이콘이 선택되었을 때만 이용할 수 있습니다.

위성 플롯을 보려면:

1.  데이터 폴더를 개방하기 위해서, 다음 중 하나의 방법을 이용합니다:

 제어 표시 줄에서 다음 중 하나의 방법으로 데이터 폴더를 개방합니다:

 원하는 데이터 폴더에서 [image] 을 클릭합니다.

 데이터 폴더에 마우스 오른쪽 단추를 클릭하고 [모두 개방]을 선택합니다.

 Timeline 도구모음에서 [image] 을 클릭합니다.

첫 번째 동작은 선택한 데이터 폴더에 속한 모든 [위성] 아이콘들이 나타나도록 합니다. 두 번째 동작은 모든 데이터 폴더를 개방합니다.

2.  원하는 위성 아이콘을 선택합니다.

3.  [위성 플롯] 명령을 선택하기 위해 다음 중 하나의 방법을 이용합니다:

 [위성 아이콘]에 마우스 오른쪽 단추를 클릭하면 [위성 플롯] 명령을 가진 메뉴가 나옵니다.

 Timeline 도구모음에서 [image] 을 클릭합니다.


   [시간 옵션] 명령 (Timeline)

추가정보

대화상자	기타
이 명령은 시간 옵션대화상자를 표시하기 위해서 선택합니다. [시간 옵션] 대화상자에는 시간자, [Timeline 등록정보] 대화상자, 위성 플롯, 하늘 플롯, DOP 플롯 그리고 [측량보기] 상태 표시 줄에서 시간을 표시하는데 사용하는 시간 형식을 선택할 수 있는 옵션이 들어 있습니다.

해당 [대화상자]를 보려면 다음 중 하나의 방법을 이용합니다:

 [시간자]를 더블 클릭합니다.

 [시간자]에 마우스 오른쪽 단추를 클릭하면 [시간 옵션] 명령이 나옵니다.


   [보기 필터] 명령 (Timeline)

추가 정보

방법. . .	기타
타임 스팬 뷰어에 나타나는 정보를 필터 하는데 사용하는 명령들이 들어 있는 서브 메뉴를 표시하기 위해서 이 명령을 선택합니다:

1. 	타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다.

2. 	해당 메뉴에서 [보기 필터]를 선택합니다.

명령들이 들어 있는 하나의 서브 메뉴가 나타납니다.

다음 명령들을 이용할 수 있습니다:

 연속

 위성

 위성궤도력

참조: 위 명령들은 Timeline 도구 모음에서는 이용할 수 없으며, 서브 메뉴에서 개별 명령으로만 사용할 수 있습니다.


  [확대] 명령 (Timeline)

추가정보

 기타

타임 스팬 뷰어를 200% 확대하기 위해서 이 명령을 선택합니다. 더 짧은 타임 스팬을 나타내기 위해서 시간자의 시작 및 정지 필드가 조정됩니다.

타임 스팬 뷰어에서 [확대] 명령을 선택하려면:

 타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다. [확대] 명령을 가진 메뉴가 나타납니다.

 [측량 보기] 화면 에서 [확대] 명령을 선택하려면:

1. 	타임 스팬 뷰어 배경을 클릭합니다.

2. 	[확대] 명령을 선택하기 위해서, 다음 중 하나의 방법을 이용합니다:

 [확대] 명령을 가진 서브 메뉴를 표시하기 위해서 보기 / 확대/축소를 선택합니다.

 [보기 제어] 도구모음에서 [image] 을 클릭합니다.


   [전체 보기] 명령 (Timeline)

추가 정보

 기타

전체 Timeline을 보기 위해서 즉,  타임 스팬 뷰어를 축소하기 위해 이 명령을 선택합니다. 이 명령은 전반적인 Timeline과 관련하여 특정 Timeline 요소의 선점 타임 스팬을 표시하는데 유용합니다. 이 명령을 이용하다가 [직전배율] 명령을 이용해서 원래 크기로 돌아갈 수 있습니다.

Timeline 보기 영역에서 [전체 보기]를 선택하려면:

 Timeline 요소 혹은 창 배경에 마우스 오른쪽 단추를 클릭합니다.

[전체 보기] 명령을 가진 메뉴가 나타납니다.

[측량 보기] 화면에서 [전체 보기] 명령을 선택하려면:

1. 	Timeline 요소 혹은 타임 스팬 뷰어 배경을 클릭합니다.

2. 	[보기 /  확대/축소]를 선택하면 [전체] 명령을 가진 서브 메뉴가 나옵니다.


  [축소] 명령 (Timeline)

축소 명령

 기타

타임 스팬 뷰어를 50% 축소하기 위해서 이 명령을 선택합니다. 더 긴 타임 스팬을 나타내기 위해서 시간자의 시작 및 정지 필드가 조정 됩니다.

Timeline에서 [축소] 명령을 선택하려면:

 타임 스팬 뷰어 배경에 마우스 오른쪽 단추를 클릭합니다. [축소] 명령을 가진 메뉴가 나타납니다.

[측량 보기] 화면에서 [축소] 명령을 선택하려면:

1. 	타임 스팬 뷰어 배경을 클릭합니다.

2. 	다음 중 하나의 방법을 이용합니다:

 [축소] 명령을 가진 서브 메뉴를 표시하기 위해 [보기 / 확대/축소]를 선택합니다.

 [보기 제어] 도구 모음에서 [image] 을 클릭합니다.


   [직전 배율] 명령(Timeline)

추가 정보

 기타

직전의 확대 배율로 돌아가기 위해서 이 명령을 선택합니다.

Timeline 보기 영역에서 [직전 배율] 명령을 선택하려면:

 Timeline 요소에 마우스 오른쪽 단추를 클릭합니다. [직전 배율] 명령을 가진 메뉴가 나타납니다.

 [측량 보기] 화면에서 [직전 배율] 명령을 선택하려면:

1. 	Timeline 요소를 클릭합니다.

2. 	이 명령을 선택하기 위해서, 다음 중 하나의 방법을 이용합니다:

 [보기 / 확대/축소]를 선택하면 [직전 배율] 명령을 가진 서브 메뉴가 나옵니다.

 [보기 제어] 도구 모음에서 [image] 을 클릭합니다.


   [스팬 범위 보기] 명령 (Timeline)

추가정보

 기타

선택된 Timeline 요소의 타임 스팬을 타임 스팬 뷰어의 너비로 확대하기 위해서 이 명령을 선택합니다.

해당 요소를 타임 스팬 뷰어의 너비에 맞게 확대하려면:

1. 	Timeline 요소를 선택합니다.

2. 	해당 요소에 마우스 오른쪽 단추를 클릭합니다.

3. 	[스팬 범위 보기]를 선택합니다.


   [이벤트] 명령 (Timeline)

추가정보

방법. . .	기타
타임 스팬 뷰어에서 [이벤트] 아이콘을 보기 위해서 이 명령을 선택합니다:

 Timeline 도구모음에서, [image] 을 클릭합니다. 데이터에 이벤트가 포함되어 있을 경우, 타임 스팬 뷰어에 [이벤트] 아이콘이 나타납니다.


   [등록정보] 명령 (Timeline)

추가 정보

방법. . .	대화상자
선택한 Timeline 요소에 대한 [등록정보] 대화상자를 불러오기 위해서 이 명령을 선택합니다:

1. 	Timeline 요소에 마우스 오른쪽 단추를 클릭합니다.

2. 	[등록정보]를 선택합니다. 해당되는 [등록정보] 대화상자가 나타납니다.

[등록정보] 명령은 다음과 같은 대화상자들을 불러옵니다:

 수신기 등록정보

 GPS 관측치

 측량

 Static 선점

 연속 선점 세그먼트

 위성궤도력 아이콘

팁: Timeline 요소를 더블 클릭해서 등록정보를 볼 수도 있습니다.


   [Timeline플롯] 명령 (Timeline)

[Timeline 플롯] 도구모음을 표시하거나 숨기기 위해서 이 명령을 선택합니다.

 보기 / 도구모음 / Timeline플롯을 선택합니다. 이 명령을 실행할 때 마다 [Timeline플롯] 도구모음이 표시되거나 숨겨집니다.


   [Timeline] 명령 (Toolbars)

Timeline 도구모음을 표시하거나 숨기기 위해서 이 명령을 선택합니다:

 보기 / 도구모음 / Timeline을 선택합니다. 이 명령을 실행 할 때 마다 Timeline 도구모음이 표시되거나 숨겨집니다.


   [스테이션] 명령(Timeline)

추가 정보

방법. . .	기타
작은 빨간 직사각형 [스테이션] 아이콘과 라벨은 Static 선점을 나타내며 이들은 다음과 같이 필터 될 수 있습니다:

1. 	Timeline 을 봅니다.

2. 	Timeline 도구모음에서 [image] 을 클릭합니다.

[스테이션] 명령이 실행될 때 마다 [스테이션] 아이콘이 켜지거나 꺼집니다.

참조: [스테이션] 아이콘은 삭제하거나  '불이용'으로 만들 수 없습니다  �  이들은 모 선점이 삭제되거나 '불이용' 될 경우에만 함께 삭제 혹은 '불이용' 됩니다.


   [모두 선택] 명령(Timeline)

추가 정보

방법. . .	기타
관측 시간, 날짜를 포함하는 필드의 전체 데이터를 선택하기 위해서 [타임 스팬 편집] 필드에서 이 명령을 선택합니다. 이 명령은 클립보드에 데이터를 잘라내거나  복사하기 위해 모든 데이터를 선택할 때 유용합니다.

[타임 스팬 편집] 필드에서 모든 데이터를 선택하려면:

1. 	타임 스팬 편집의 [시작] 혹은 [정지] 난을 클릭합니다.

2. 	마우스 오른쪽 단추를 클릭하고 [모두 선택]을 선택합니다.

필드의 모든 데이터가 선택됩니다.


    [수신기 등록정보] 대화상자

추가 정보

 개요 및 추가정보

측량 데이터를 수집할 때 사용하는 수신기의 일반적인 정보를 알고자 할 때 이 대화상자를 사용합니다. 모든 필드는 읽기 전용 데이터로 되어있으며, 이 데이터는 다운로드한 수신기의 정보 레코드에서, 또는 RINEX 파일에 있는 헤더 레코드에서 얻습니다.

[수신기 등록정보] 대화상자를 보려면:

  해당 데이터 폴더를 마우스로 두 번 클릭합니다. [수신기 등록정보] 대화상자가 나오며, 다음의 읽기 전용 필드들을 가지고 있습니다:

일련 번호

이 필드는 수신기의 일련 번호를 나타냅니다.

수신기 종류

이 필드는 수신기의 모델을 나타냅니다.


    [측량 등록정보] 대화상자

추가 정보

대화상자	기타
개별적인 측량 데이터 로깅 세션의 정보를 보고자 할 때 이 대화상자를 사용합니다.

[측량 등록정보] 대화상자를 열려면, 다음 중 하나를 실행합니다:

  [측량 요소]를 마우스로 두 번 클릭합니다.

  [측량 요소]를 마우스 오른 쪽으로 클릭하고 [등록정보]를 선택합니다.

다음과 같은 데이터 필드를 이용할 수 있습니다:

세션 ID

이 필드에는 측량 세션의 이름이 나타납니다. 세션을 새로운 방식으로 표시하고자 할 때에는 새 [세션 ID]을 직접 입력합니다. 이 필드는 여기에서 유일하게 편집 가능한 필드입니다.

데이터 파일 이름

이 필드는 측량과 관련된 파일의 이름을 나타냅니다.

시작 시간

이 필드는 [측량 세션]의 시작 시간을 [윈도우 로컬 시간] 또는 [GPS 주/초] 시간으로 표시합니다. 이 때의 시간 형식은 현재의 시간 옵션 설정에 따릅니다.

정지 시간

이 필드는 [측량 세션]의 정지 시간을 [윈도우 로컬 시간] 또는 [GPS 주/초] 시간으로 나타냅니다. 이 때의 시간 형식은 현재의 [시간 옵션] 설정에 따릅니다.

항법 처리기 버전

이 필드는 수신기 [항법처리기]의 Firmware 버전을 나타냅니다 (Trimble 수신기).

에포크 율

이 필드는 측량 세션에서 데이터를 수집할 때 사용되는 최소 동기화 율을 초 단위로 나타냅니다.

신호 처리기 버전

이 필드는 수신기 [신호 처리기]의 Firmware 버전을 나타냅니다 (Trimble 수신기).

임계 앙각

이 필드는 측량 데이터가 수집되었을 당시 유효한 임계 앙각을 나타냅니다.

데이터 컬렉터 종류

이 필드는 측량에 어떤 측량 데이터가 사용되었을 경우, 관련하여 사용한 데이터 컬렉터의 종류와 Survey Controller의 버전 번호를 나타냅니다.


    [선점/데이터 세그먼트 등록정보] 대화상자 - 개요

추가 정보

방법...	대화상자	기타
Static 선점, 연속 세그먼트, 이동 세그먼트에 관한 관련 정보를 보고 편집하고자 할 때 이 대화상자를 사용합니다. 각 세그먼트 별로 별도의 대화상자를 열어, 다중 세그먼트의 데이터를 서로 비교할 수 있습니다.

[선점/데이터 세그먼트 등록정보] 대화상자를 보려면, 다음 중 하나를 실행합니다:

  [선점요소]를 마우스로 두 번 클릭합니다.

  [선점 요소]를 마우스의 오른쪽으로 한 번 클릭하고 [등록정보]를 선택합니다.

다음의 두 탭을 이용할 수 있습니다:

  세그먼트

  안테나

[선점/데이터 세그먼트 등록정보] 대화상자의 우측 상단에 좌우 이동 단추가 있습니다. 측량에 복수의 선점이 포함되어 있을 경우, 이 이동 단추를 이용하여 그 다음의 선점 또는 그 이전의 선점 정보를 볼 수 있습니다. 만약 그 다음 선점의 대화상자가 다른 등록정보 대화상자에 이미 표시된 상태에서 우측 이동 단추를 누르면, 그 선점은 건너 뜁니다.


    [선점/데이터 세그먼트 등록정보] 대화상자 - 세그먼트 탭

추가 정보

방법...	대화상자	기타
[세그먼트] 탭은 선점에 관한 전반적인 정보를 표시하며 이를 편집할 수 있습니다.

[세그먼트] 탭을 보려면, 다음 중 하나를 실행합니다:

  [선점 요소]를 마우스로 두 번 클릭합니다.

  [선점 요소]를 마우스의 오른쪽으로 한 번 클릭하고, [등록정보]를 선택합니다.

[선점/데이터 세그먼트 등록정보] 대화상자가 나타나며 [세그먼트] 탭이 선택되어 있습니다.

다음과 같은  필드가 나타납니다:

포인트 이름

선점이 일어난 해당 포인트 이름이 이 필드에 기록됩니다. [이동 및 연속 세그먼트]의 경우에는 이 필드가 공백으로 나타납니다.

세그먼트 형식

다음과 같은 여러 종류의 세그먼트 중에서 한가지를 선택하여 형식을 변경합니다:

  Static 선점

  FastStatic 선점

  Stop&Go 선점

  이동 세그먼트

  연속 세그먼트

참조: 파일에서 사용할 수 있는 데이터의 형식에 따라, Static 및 FastStatic 옵션은 나타날 수도 있고 나타나지 않을 수도 있습니다.

경고: 선점을 [이동] 또는 [연속]으로 변경, 지정할 때에는 주의를 요합니다. 만약 어떤 Static 선점이 연속으로 변경되면, 해당 선점에 대한 스테이션의 기준이 삭제됩니다.

시작 시간

선점의 시작시간을 변경하고자 할 때 이 필드를 편집합니다. 현재의 [시간 옵션] 설정에 따라 [윈도우 로컬 시간] 또는 [GPS 주/초] 시간으로 표시됩니다.

정지 시간

선점의 정지시간을 변경하고자 할 때 이 필드를 편집합니다. 현재의 [시간 옵션] 설정에 따라 [윈도우 로컬 시간] 또는 [GPS 주/초] 시간으로 표시됩니다.

팁: [타임 스팬 뷰어]의 선점요소를 선택한 후 시간자의 [시작 시간]과 [정지 시간] 필드를 변경함으로 시간을 편집할 수도 있습니다.


    [선점/데이터 세그먼트 등록정보] 대화상자 - 안테나 탭

추가 정보

방법...	대화상자	기타
안테나 높이(미터), 안테나 종류 및 측정 방법을 조정하고자 할 때 이 탭을 사용합니다.

[안테나 등록정보]를 보려면:

1.	[선점/데이터 세그먼트 등록정보] 대화상자를 열기 위해 다음 중 하나를 실행합니다:

  [선점 요소]를 마우스로 두 번 클릭합니다.

  [선점요소]를 마우스의 오른쪽으로 한 번 클릭하고, [등록정보]를 선택합니다.

      [선점/데이터 세그먼트 등록정보] 대화상자가 나타납니다.

2.	[안테나] 탭을 마우스로 클릭합니다.

안테나 등록정보가 나타납니다.

안테나 높이

측정된 안테나의 높이를 보거나 편집하고자 할 때 이 필드를 사용합니다.

종류

수신기에 연결된 안테나의 종류를 보거나 선택할 때 이 필드를 사용합니다

높이 지점

안테나의 높이를 측정할 때 사용한 방법을 보거나 이를 변경할 때 사용합니다.

[높이 지점]필드 아래에는 안테나 정보를 적용하는 방법을 설정하는 다음과 같은 단추들이 있습니다:

  [이 측정치에만]  이 단추는 변경사항을 선택한 선점이나 세그먼트에만 적용합니다. 이것은 기본 설정입니다.

  [이 세션에서의 이 측정치와 그 후속 측정치]  이 단추는 선택된 선점 또는 세그먼트는 물론, 측량 요소와 관련되는 후속 선점과 세그먼트에 변경사항을 적용합니다.

  [이 세션에서의 모든 측정치]  이 단추는 [측량요소]의 모든 선점과 세그먼트에 변경사항을 적용합니다.


    [GPS 관측치 등록정보] 대화상자

추가 정보

방법...	대화상자	기타
선택된 GPS 관측치 요소 에서 이용 가능한 관측치 종류를 보고자 할 때 이 대화상자를 사용합니다.

[GPS 관측치 등록정보] 대화상자를 보려면:

1.	제어표시줄에 있는 데이터 폴더를 열기 위해 다음 중 하나를 실행합니다:

  데이터 폴더에 마우스의 오른쪽을 클릭하고, [모두 개방]을 선택합니다.

  [Timeline] 도구 표시줄에서, [image] 을 클릭합니다.

  데이터 폴더에서 [image] 기호를 클릭합니다.

[타임 스팬 뷰어]에는 관련 [GPS 관측치]가 나타나고 제어 표시줄에는 관련 [위성 아이콘]이 나타납니다.

팁: [Timeline] 도구 표시줄에서 [image] 을 클릭하거나, 데이터 폴더에 마우스의 오른쪽을 누른 후 메뉴에서 [모두 수축]을 선택하면, 이 요소들이 숨겨져 안보기에 됩니다.  을 눌러 개별적으로 폴더를 닫을 수도 있습니다.

2.	[등록정보] 대화상자를 불러오려면, 다음 중 하나를 실행합니다:

  하나의 [GPS 관측치 요소]를 마우스로 두 번 클릭합니다.

  하나의 [GPS 관측치 요소]를 마우스의 오른쪽으로 클릭하고, [등록정보]를 선택합니다.

[GPS 관측치 등록정보] 대화상자가 나타납니다.

다음의 필드들을 이용할 수 있습니다:

시작

선택된 GPS 관측치의 시작 시간을 변경하고자 할 때 이 필드를 편집합니다. 이 필드에 나타나는 시간은 타임 스팬 뷰어에 있는 선택된 현재의 [GPS 관측치]에 근거 합니다. GPS 관측치 데이터에 적용되는 모든 변경사항은 이 시작 시간을 기준으로 합니다. 이 필드의 시작 시간을 변경하면 변경사항이 [편집할 위성] 목록에서 선택된 관련 위성과 [타임 스팬 뷰어]에서 선택된 관련 GPS 관측치 영역에 적용됩니다.

정지

선택된 [GPS 관측치]의 정지 시간을 변경하고자 할 때 이 필드를 편집합니다. 이 필드에 나타나는 시간은 [타임 스팬 뷰어]에 있는 선택된 현재의 [GPS 관측치]에 근거합니다. GPS 관측치 데이터에 적용되는 모든 변경사항은 이 정지 시간을 기준으로 합니다. 이 필드의 정지 시간을 변경하면 변경사항이 [편집할 위성] 목록에서 선택된 관련 위성과 [타임 스팬 뷰어]에서 선택된 관련 GPS 관측치 영역에 적용됩니다.

관측치 종류

GPS 관측치 등록정보에 있는 관측치 종류에 따라 [이용] 또는 [불이용]으로 설정하고자 할 때 이 제어 그룹을 사용합니다. 하나의 [관측치 종류]는 하나의 원시 위성 정보 형태를 나타냅니다.

[관측치 종류]에서는 다음과 같은 체크상자들을 이용할 수 있습니다:

  L1 위상

  L1 P코드

  L1 C/A-코드

  L2 전위상

  L2 반위상

  L2 P코드

  암호화된 L2

[관측치 종류]를 보거나 편집할 때는 다음의 지침을 고려하시기 바랍니다:

  [관측치 종류]에 체크 표시가 되어있으면 이는 데이터가 사용되었음을 나타내고, 아무 표시가 없는 체크상자는 해당 데이터 형이 포함되지 않았음을 나타냅니다.

  회색의 체크 표시는 [이용 스팬]과 [불이용 스팬]이 GPS 관측치 안에 함께 있으며, [관측치 종류]에 대해서는 할 작업이 없음을 나타냅니다.

  체크 표시에 인접한 어두운 텍스트는 [관측치 종류]를 이용할 수 없음을 나타냅니다.

  선택된 데이터를 '불이용' 상태로 하려면 체크 표시를 해제하면 됩니다.

리셋

이 단추를 누르면 모든 [관측치 종류]의 체크 박스들이 원래의 상태 � 즉, 관측 데이터가 현장에서 처음 수집되던 때의 상태로 재설정됩니다.

편집할 위성

위성들을 선택하고 그와 관련된 원시 GPS 관측치 데이터를 선택해서 편집하고자 할 때 이 목록에 있는 체크 박스들을 선택합니다.

참조: 이 목록에서 복수의 위성을 선택하면 [등록정보]의 변경사항은 이 [등록정보] 대화상자에서 설정한 시간에 해당하는 모든 GPS 관측치에 적용됩니다.

팁: [타임 스팬 뷰어]에서 GPS 관측치를 직접 선택하려면, 해당 GPS 관측치들의 주위에, 또는 특정 GPS 관측치 주위에 마우스를 끌어 선택 직사각형을 그리면 됩니다. 자세한 내용은 GPS 관측치 선택 및 편집을 참조하시기 바랍니다.

모두 이용

[시작]과 [정지] 필드에 정의한 시간 동안 [편집할 위성] 목록에서 선택한 위성의 모든 [관측치 종류]를 '이용' 상태로 하고자 할 때 이 단추를 클릭합니다.

모두 불이용

[시작]과 [정지] 필드에 정의한 시간 동안 [편집할 위성] 목록에서 선택한 위성의 모든 [관측치 종류]를 '불이용'  상태로 하고자 할 때 이 단추를 클릭합니다.


    L1 위상

 개요 및 추가정보

이 [관측치 종류]는 수신기가 [L1 위상] 측정치들을 복구할 수 있을 때 이용할 수 있습니다. 1 주파 수신기나 2 주파 수신기로 이 데이터를 추적할 수 있습니다.

만약 이 체크상자가 선택되어 있으면 이를 해제해서(각각의 위성, 복수의 위성, 또는 GPS 관측치 요소의 영역 별로 해제) [L1 위상] 데이터를 '불이용' 상태로 만들 수 있습니다.


    L1 P코드

 개요 및 추가정보

이 [관측치 종류]는 L1 반송파 상에서 [L1 P-코드]가 추적될 때 이용할 수 있습니다. 안티 스푸핑(Anti-spoofing) 기능을 끄면 대부분의 신형 2 주파 수신기와 일부 1 주파 수신기로 이 데이터를 추적할 수 있습니다.

만약 이 체크상자가 선택되어 있으면, 이를 해제해서(각각의 위성, 복수의 위성, 또는 GPS 관측치 요소의 영역 별로 해제) [L1 P-코드] 데이터를 '불이용' 상태로 만들 수 있습니다.


    L1 C/A-코드

 개요 및 추가정보

이 [관측치 종류]는 L1 반송파 상에서 [C/A 코드]가 추적될 때 이용할 수 있습니다. 1 주파 수신기 또는 2 주파 수신기로 이 데이터를 추적할 수 있습니다.

만약 이 체크상자가 선택되어 있으면, 이를 각각의 위성, 복수의 위성, 또는 GPS 관측치 요소의 영역 별로 해제해서 [L1 C/A-코드] 데이터를 '불이용' 상태로 만들 수 있습니다.


    L2 전 위상

 개요 및 추가정보

이 [관측치 종류]는 GPS 수신기가 [전 위상 L2 반송파 위상] 측정치를 복구할 수 있을 때 이용할 수 있습니다. 대부분의 현행 2 주파 수신기로 이 데이터를 수집할 수 있습니다.

만약 이 체크상자가 선택되어 있으면, 이를 해제해서(각각의 위성, 복수의 위성, 또는 GPS 관측치 요소의 영역 별로 해제) [L2 전 위상] 데이터를 '불이용' 상태로 만들 수 있습니다.


    L2 반 위상

 개요 및 추가정보

이 [관측치 종류]는 수신기가 [반 위상 L2 반송파 위상] 측정치 만 복구할 수 있을 때 이용할 수 있습니다. 일부 2 주파 수신기로 이 데이터를 수집할 수 있습니다.

만약 이 체크상자가 선택되어 있으면, 이를 각각의 위성이나 복수의 위성 별로 해제해서 [L2 반 위상] 데이터를 '불이용' 상태로 만들 수 있습니다.


    L2 P코드

 개요 및 추가정보

이 [관측치 종류]는 L2 반송파 상에서 L2 P-코드가 추적될 때 이용할 수 있습니다. 안티 스푸핑(Anti-spoofing)을 끄면 대부분의 현행 2 주파 수신기로 이 데이터를 수집할 수 있습니다.

만약 이 체크상자 가 선택되어 있으면, 이를 각각의 위성, 복수의 위성, 또는 GPS 관측치 요소의 영역 별로 해제해서 [L2 P 코드] 데이터를 '불이용' 상태로 만들 수 있습니다.


    암호화된L2

 개요 및 추가정보

이 [관측치 종류]는 안티 스푸핑(Anti-spoofing) 기능이 켜 있는 동안 [L2 P-코드]를 암호화할 때 이용할 수 있습니다. Trimble 수신기는 당사 특허 기술을 사용하여 L2 상에서 코드를 추적할 수 있으며, 암호화 기간 중에도 추적합니다. 이 특허 기술을 통하여 이용할 수 있는 측정치를 [암호화된 L2]라고 합니다.

만약 이 체크상자 가 선택되어 있으면, 이를 해제해서 (각각의 위성, 복수의 위성, 또는 GPS 관측치 요소의 영역 별로 해제) [암호화된 L2 ] 데이터를 '불이용' 상태로 만들 수 있습니다.


    [위성 궤도력  등록정보] 대화상자

추가 정보

방법...	대화상자	기타
GPS 사용자들에게 비정기적으로 방송되는 [위성 궤도력] 정보를 보고자 할 때 이 대화상자를 이용합니다. 이 정보는 위성 데이터에서 비롯하는 것으로 편집할 수 없습니다.

[위성 궤도력 등록정보] 대화상자를 보려면:

1.	[위성 궤도력] 아이콘을 불러오기 위해 다음 중 하나를 실행합니다:

  Timeline 도구표시줄에서 [image] 을 클릭합니다.

  [타임 스팬 뷰어]를 마우스의 오른쪽으로 클릭하고, 보기 필터 / 위성 궤도력을 선택합니다.

청색의 [위성 궤도력] 아이콘이 [위성 추적] 정보 상에 나타납니다.

2.	[위성 궤도력] 등록정보를 보기 위해 다음 중 하나를 실행합니다:

  원하는 위성의 [위성 궤도력] 아이콘을 두 번 클릭합니다.

  원하는 위성의 [위성 궤도력] 아이콘을 마우스의 오른쪽으로 클릭하고 [등록정보]를 선택합니다.

[위성 궤도력 정보] 대화상자가 열립니다.

다음과 같은 옵션을 이용할 수 있습니다:

위성

이 필드는 해당 위성에 할당된 [위성 PRN 코드]를 보여줍니다.

수집 시간

이 필드는 방송 위성 궤도력이 위성으로부터 수집된 시간을 [GPS 주/초] 또는 [윈도우 로컬 시간]으로 나타냅니다. 이 때의 시간 형식은 현재의 시간 옵션 설정에 따릅니다.

IODC

이 필드는 방송 위성 궤도력에 포함되어 있는 데이터, 시계 값의 발행을 표시합니다.

위성 궤도력 시간

이 필드는 위성 궤도력이 발행된 시간을 [GPS 주/초] 혹은 [윈도우 로컬 시간]으로 표시합니다. 이 때의 시간 형식은 현재의 [시간 옵션] 설정에 따릅니다.

에포크로부터의 시간

이 필드는 [위성 궤도력 기준 에포크]로부터의 시간을 근사치 분으로 반올림한 값을 표시합니다.

GPS 주

이 필드는 위성 궤도력이 수집된 GPS 주를 나타냅니다.

[GPS 0 (영) 주]는 1980년 1월 6일에 시작되었습니다. 1 [GPS 주 사이클]은 1,024 주 (0 − 1023 ) 또는 7,168 일입니다. 따라서 [GPS 주 사이클]은 1999년 8월 21일 자정에 한 사이클을 돌았습니다. 이 때에 위성에서 방송된 [GPS 주]는 다시 0 (영) 주로 변했습니다. 그러나 Trimble 수신기는 내부적으로 주 계산을 연속으로 유지하고 있습니다.

[GPS 초]는 매 GPS 주의 토요일 자정에 영이 되며, 협정 세계시(UTC)와 상관관계를 가집니다.

URA

이 필드는 위성의 사용자 거리 정확도를 미터로 환산해서 보여줍니다. URA는 위성 데이터의 질을 나타내는 거리 정확도의 지표입니다.

URA 경보

이 필드는 위성을 위한 [사용자 거리 정확도 경보] 플래그의 작동 여부를 알려줍니다. 이 플래그는 거리 정확도가 URA의 표시 값보다 낮을 경우 설정됩니다.

양호 상태

이 필드는 위성 궤도력에 들어있는 위성 메시지의 양호 상태를 나타냅니다. 양호 상태 메시지는 위성으로부터 방송되는 신호의 질을 나타내는 지표입니다. 위성이 양호 상태일 때 이 필드에 다음과 같은 메시지가 나타납니다:

모든 위성 데이터 양호

이 밖에도 여러 가지 다른 메시지가 표시될 수도 있으나, 이들은 대체로 위성 상태가 양호하지 못함을 의미합니다. 이 메시지에 관한 자세한 정보는 참고 문헌에 있는 책자 ICD-GPS-200을 구입해서 참조하시기 바랍니다.

A/S

이 필드는 위성을 위한 안티 스푸핑(anti-Spoofing) 플래그의 [실행] 여부를 알려줍니다.


    [시간 옵션] 대화상자

추가 정보

방법...	대화상자
[시간자]의 타임 스팬을 표시하는 형식, 모든 [Timeline] 대화상자, 각종 시간 표시 및 상태 표시줄에 나타나는 시간 형식을 선택하고자 할 때 이 대화상자를 사용합니다.

[시간 옵션] 대화상자를 불러 오려면, 다음 중 하나를 실행합니다:

  [시간자] 안에서 마우스를 두 번 클릭합니다.

  [시간자]를 마우스 오른쪽으로 클릭한 후 [시간 옵션]을 선택하면 [시간 옵션] 대화상자가 나타납니다.

다음과 같은 옵션을 이용할 수 있습니다:

로컬 시간

[윈도우 로컬 시간] 형식으로 시간을 표시하고자 할 때 이 필드를 선택합니다.

GPS 주/초

[GPS 주/초] 형식으로 시간을 표시하고자 할 때 이 필드를 선택합니다.

[GPS 0 (영) 주]는 1980년 1월 6일에 시작되었습니다. 1 [GPS 주 사이클]은 1,024 주 (0 − 1023 ) 또는 7,168 일입니다. 따라서 [GPS 주 사이클]은 1999년 8월 21일 자정에 한 사이클을 돌았습니다. 이 때에 위성에서 방송된 [GPS 주]는 다시 0 (영) 주로 변했습니다. 그러나 Trimble 수신기는 내부적으로 주 계산을 연속으로 유지하고 있습니다.

[GPS 초]는 매 GPS 주의 토요일 자정에 영이 되며, 협정 세계시(UTC)와 상관관계를 가집니다.


    연속 세그먼트

추가 정보

방법…	대화 상자	기타
[연속] 세그먼트는 수신기가 움직이면서 연속적으로 데이터를 수집할 때 시간의 길이를 나타냅니다. [연속] 세그먼트의 목적은 베이스로부터 수신기까지 매 측정 사이클마다 기선을 처리하는 것입니다. [이동] 세그먼트가 [연속] 세그먼트와 다른 점은 [이동] 세그먼트는 처리 대상이 아니라는 점입니다. [연속] 세그먼트는 처리하기 전  즉, 처음에는 포인트와 관련을 갖지 않습니다. 그러나 일단 처리가 끝나면 포인트가 만들어져서 각각의 수신 측정 사이클에 대한 프로젝트에 저장 됩니다. 그리하여 [측량] 화면에서 수신기의 경로를 보여줍니다.

연속 세그먼트의 등록 정보를 보거나 편집하려면 [연속] 세그먼트 요소를 두 번 클릭 합니다.

[세그먼트] 요소의 어디서든 마우스 오른쪽 단추를 클릭하면 [세그먼트] 데이터로 작업하기 위한 명령어를 가진 메뉴가 나타납니다.

[연속] 세그먼트의 시간 길이는 조정될 수 있습니다. 또한 처리가 일어나지 않도록 [연속] 세그먼트를 [이동] 세그먼트로 바꿀 수도 있습니다.

[그래픽] 창과 Timeline이 연결되어 있기 때문에 [그래픽] 창에 선택된 포인트 선점과 기선은 Timeline에도 선택되어 있고, Timeline에 선택되어 있는 것은 [그래픽] 창에도 선택되어 있습니다. 예를 들어, [그래픽] 창에 선택된 포인트와 기선을 보기 위해서는 Timeline에서 [연속] 세그먼트를 선택해도 됩니다. 일단 포인트 또는 기선을 선택하면 선점에 대한 자세한 정보를 가진 해당 등록 정보를 볼 수 있습니다.

연속 세그먼트를 선택하면, 선점이나 세그먼트가 진행되는 동안의 위성군에 대한 정보를 가진 두 개의 플롯이 나타나게 됩니다. 더 자세한 정보를 원하면 다음 항목을 참조하시기 바랍니다:

  DOP 플롯

  하늘 플롯

팁: [그래픽] 창에서 이용할 수 있는 등록 정보 창은 선택된 선점을 찾기 위하여 Timeline을 탐색할 때도 유용합니다. 이 대화 상자에서 선택한 기선과 포인트의 선점은 Timeline에도 선택되어 있습니다. 일단 선택한 후에는 Timeline에 있는 선점 요소를 두 번 클릭하여 해당 등록 정보를 볼 수 있습니다.

[선점]과 [세그먼트] 요소는 알아보기 쉽도록 색깔이 있는 직사각형  안에 나타납니다. 더 자세한 정보를 원하면 선점 색상코드 구성표를 참조 하시기 바랍니다.


    타임스팬(Time Span) 뷰어

추가 정보

방법…	대화 상자	기타
[타임스팬뷰어]는 돋보기라고 생각 하면 됩니다. 즉, Timeline 전체를 보거나, Timeline의 작은 "스팬(span)"을 보기 위하여 중심을 이동하거나, 확대/축소할 수 있습니다.

Timeline에는 여러 가지 옵션이 있어서 [타임스팬뷰어]를 확대/축소하거나 중심을 이동해서 Timeline상의 선택한 정보를 볼 수 있습니다. 선점이나 GPS 관측치와 같은 요소들을 [타임스팬뷰어]에 다음의 두 가지 방법으로 나타낼 수 있습니다:

  확대/축소 명령을 선택한 후 다음의 하위 명령을 선택합니다:

  확대

  축소

  전체 보기

  직전 배율

  스팬 범위 보기

  Timeline의 선택된 영역으로 [타임스팬뷰어]를 이동하기 위해서 타임스팬 필드를 편집합니다.

시간자(Time Ruler)의 좌측과 우측에 있는 타임스팬 난에 관측치의 시간 길이가 표시되어 나타나게 됩니다. 시간 길이가 너무 길어지면 Timeline은 자동으로 이동해 마지막 날의 관측치만 표시해 줍니다.

Timeline 요소는 측량 기간 동안 수집된 데이터를 의미 합니다. Timeline과 [그래픽] 창이 상호 연결되어 있으므로 이 창에서 선택된 데이터는 [타임스팬뷰어]에서도 선택됩니다.

[타임스팬뷰어] 배경에 마우스 오른쪽 단추를 클릭하면 명령들을 가진 메뉴가 나옵니다.


    위성 궤도력 아이콘

추가 정보

방법...	대화상자	기타
이 아이콘은 개별 위성의 수신기가 방송 위성 궤도력을 받은 시간을 알려 줍니다. 측량하는 동안 추적된 개별 위성에 대한 [위성 궤도력] 정보는 다음과 같은 때에 기록이 됩니다.

  측량 시작 때 (위성이 보일 경우)

  위성이 임계앙각 위로 처음 올라갔을 때

  시간 별

Timeline 이 처음 보일 때 이 아이콘에 대한 필터는 꺼져 있습니다. 사용자가 아이콘들을 필터 하려면 Timeline 도구 모음을 이용하거나 Timeline 보기 영역에서 이용할 있는 여러 메뉴명령을 선택하면 됩니다. 더 자세한 정보를 원하면 Timeline 요소 필터를 참조하시기 바랍니다.

위성 궤도력 등록 정보 대화 상자를 보려면 해당 아이콘을 두 번 클릭하면 됩니다. 이 대화 상자에는 위성의 양호 상태에 대한 메시지 등 유용한 정보가 들어있습니다. 이 메시지는 관측치로 데이터를 보내주는 위성의 상태가 양호한지 여부를 파악하는데 유용합니다.

마우스 오른쪽 단추를 어느 아이콘에 클릭하면 위성 궤도력과 관련된 명령을 가진 메뉴 가 나옵니다.

[위성 궤도력] 아이콘은 삭제하거나 '불이용' 상태로 만들 수 없습니다. 그러나 [위성 궤도력] 아이콘과 GPS 관측치가 연결되어 있으므로, GPS 관측치 또는 GPS 관측치의 선택된 영역을 '불이용' 상태로 만들어 프로젝트로부터 관련된 모든 위성 궤도력을 제거할 수 있습니다. 더 자세한 정보를 원하면 GPS 관측치를 불이용 상태로 만들기를 참조하시기 바랍니다.


    GPS 관측치

추가 정보

방법...	대화상자	기타
GPS 관측치 요소는 한 개 또는 그  이상의 데이터 폴더를 열어서 측량 세션 동안 수집한 데이터를 보여줄 때에만 [타임스팬뷰어]에 나타납니다.

데이터 폴더를 열면 측량에 GPS 관측치를 보내준 위성 하나에 하나의 위성 아이콘 이 나타납니다. 그리고 각 아이콘 마다, 위성 추적 플롯으로 표시되는 [GPS 관측치]가 [타임스팬뷰어]에 나타납니다.

Timeline에서 서로 다른 관측 데이터들 간에 상호 구별이 되도록 아래의 모양과 색상 코드가 사용됩니다.

L1 P-코드   (초록)	L1 위상   (검정)	잘못된 거리	L1 사이클    슬립	L1 C/A-코드       (적색)
L2 전위상 (검정)	L2 P-코드   (초록)	L2 사이클     슬립	L2 암호화된       코드	L2 반위상  (진한 검정)
GPS 관측치를 평가할 때 다음의 지침을 참조 하시기 바랍니다:

  1 주파 관측치의 경우에는 L1 반송파 신호의 위성 추적 정보가 [타임스팬뷰어] 상에 플롯되어 일련의 픽셀로 나타납니다.

  2 주파 관측치의 경우에는 L1및 L2 반송파 신호의 위성 추적 정보가 [타임스팬뷰어] 상에 플롯되어  평행 두 줄의 픽셀로 나타납니다.

  추적 플롯 사이에 있는 긴 간격은 수신기가 위성을 추적하지 않은 기간을 나타냅니다. 픽셀 사이에 있는 작은 간격은 사이클 슬립과 기타의 반송파 신호 상실을 나타냅니다.

  사이클 슬립, 잘못된 거리 데이터 및 다른 출처의 의사 위성 신호 상태도 픽셀 선 내에 플롯 됩니다.

한 위성 추적 플롯 속에 있는 각각의 픽셀은 한 개의 위성으로부터 한 순간에 수집한 원시 데이터 전체를 나타낸다고 생각하면 됩니다. 이 원시 데이터는 다음과 같습니다:

  관측치 종류 � 위상, C/A-코드, P-코드 등

  신호 가용성 � 사실 또는 거짓

  신호 상태 � 유효, 무효, 사이클 슬립

  이용/불이용 상태 � 이용/불이용 플래그

이 픽셀들은 켜짐과 꺼짐이 있는 스위치와 같이 행동합니다. 픽셀을 '불이용' 상태로 하면 그에 관련된 원시 위성 데이터도 불이용 상태가 됩니다. 픽셀을 '이용' 상태로 만들면 원시 위성 데이터도 또한 '이용' 상태가 됩니다. 따라서 GPS 관측 데이터를 편집하는 동안 시행착오 접근 방법을 사용할 수 있게 됩니다. 데이터의 선택부분을 '불이용' 상태로 만든 후 기선의 재계산을 수행하여 데이터의 질이 향상되었는지 알아보고, 만일 결과가 성공적이지 못하면 데이터를 다시 '이용' 상태로 만들 수 있습니다.

GPS 관측치의 전체적인 질을 향상시키기 위해 픽셀의 작은 영역을 선택하여 (예를 들어, 사이클 슬립을 포함하는 픽셀 영역) 그 영역을 편집할 수도 있습니다.

팁: 문제성 데이터 주위에 선택 직사각형을 그려 해당 픽셀 영역을 선택할 수 있습니다 � '불이용' 상태로 만들기 원하는 영역의 좌측 상단 코너에 마우스 커서를 갖다 놓고 왼쪽 마우스 단추를 누른 상태로 끌어 해당 영역 주위에 직사각형을 그리면 됩니다.

선택된 픽셀 영역의 데이터를 '불이용' 상태로 만들려면, 선택 직사각형 내에 마우스를 두 번 클릭합니다. 그러면 GPS 관측치 등록 정보 대화 상자가 나타납니다. 이 대화 상자에는 다른 도구도 있지만, 위성 별로 하나씩 선택하여, 또는 여러 개의 위성을 한꺼번에 선택하여 선택한 원시 위성 데이터를 '이용' 또는 '불이용' 상태로 만들 수 있는 옵션이 있습니다. Timeline 요소의 선택과 편집에 대해 더 알기를 원하면 요소의 선택과 편집을 참조하시기 바랍니다.

[GPS 관측치 등록 정보] 대화 상자로 작업을 할 때 다음과 같은 다른 도구들도 이용할 수 있습니다. 즉:

  여러 개의 위성을 선택하여 해당 위성 데이터를 '불이용' 상태로 하기

  위성 관측 데이터가 수집된 시작시간과 정지시간을 편집하기

  GPS관측에 포함된 개별 관측치 종류를 편집하기

제어표시줄에서 [위성] 아이콘을 '불이용' 상태로 만들어 측량한 GPS 관측치와 관련된 모든 추적 정보를 제거할 수 있습니다. 이는 한 위성과 관련된 모든 GPS 관측치의 전반적인 양호 상태가 불량인 경우, 또는 해당 선점의 위성군에 충분한 여유 위성이 있어 해당 위성을 '불이용' 상태로 하여 탈락시켜도 문제가 안 되는 경우에 유용합니다. 더 자세한 정보를 원하면 위성을 불이용 상태로 만들기를 참조하시기 바랍니다.

팁: 위성 추적 플롯에 나타나는 가장 최근의 위성 궤도력 아이콘의 등록 정보를 보면 선택한 위성에 대한 수집된 GPS 관측치의 양호 상태를 알 수 있습니다.  위성 궤도력 내역은 약 한시간 간격으로 수신기에 의해 해독되며 각 위성의 현재 양호 상태에 관한 메시지도 포함됩니다.  URA와 [URA플래그] 필드도 위성 방송의 전반적인 질을 평가하는데 유용합니다.

[GPS 관측치] 요소의 어디에서나 마우스 오른쪽 단추를 클릭하면 [GPS 관측치] 데이터에 대한 명령 메뉴가 나타납니다.

GPS 관측치는 삭제할 수 없습니다. 그러나 GPS 관측치의 전체 또는 선택된 영역을 '불이용' 상태로는 만들 수 있습니다. 위성을 '불이용' 상태로 만들어 Timeline 안에 플롯된 모든 관련 GPS 관측치 종류를 '불이용' 상태로 만들 수 있습니다.


    선점/데이터 세그먼트 요소

추가 정보

방법…	대화 상자	기타
[선점]과 [데이터 세그먼트]는 수신기가 GPS 관측치 를 수집한 시간의 길이를 나타냅니다. 그것은 두 종류로 분류될 수 있습니다:

  Static 선점 이것은 FastStatic과 Stop&Go 선점을 포함합니다. 하나의 [선점]은 하나의 수신기가 한 포인트에 정지해있는 시간의 길이를 나타냅니다.

  연속 세그먼트, 이것은 [이동] 세그먼트를 포함합니다. [연속] 또는 [이동] 세그먼트는 수신기가 측정치를 수집하는 동안 움직인 시간의 길이를 나타냅니다.

색상 코드 구성표

[선점/데이터 세그먼트] 스팬은 색상으로 구별되는 직사각형으로 나타나며, 선점 데이터가 수집된 시간의 길이를 보여줍니다. 이 색상과 모양은 다음과 같이 서로 다른 종류의 정보를 나타내는데 사용됩니다:

  Static 과 FastStatic 선점은 크고 파란 직사각형으로 나타납니다.

  Stop&Go 선점은 작고 파란 직사각형으로 나타납니다.

  [연속] 세그먼트는 크고 초록색인 직사각형으로 나타납니다.

  [이동] 세그먼트는 작고 초록색인 직사각형으로 나타납니다.

  오차가 있는 세그먼트는 빨간 요소로 나타납니다.

위성군 플롯

선점이나 연속 세그먼트가 선택되면 그 시간의 위성군에 관한 정보를 가진 두 개의 플롯이 나타나게 됩니다. 더 자세한 정보를 원하면 다음 항목을 참조하시기 바랍니다:

  DOP 플롯

  하늘 플롯

점선

점선은 GPS 측정치는 있으나 그 측정치와 관련된 [선점]이나 [세그먼트] 요소는 없는 지역을 의미합니다.

[이동] 세그먼트는 데이터 베이스의 기본값이 아닙니다. [연속] 세그먼트를 [이동] 세그먼트로 바꾸어야 [이동] 세그먼트가 만들어 집니다. DAT 파일로부터 데이터를 TGO로 가져올 때 모든 [이동] 세그먼트에 대한 [이용] 체크박스가 해제됩니다.

만일 체크박스가 해제된 상태이면 [이동] 세그먼트는 프로젝트에 로드되지 않습니다. 그리고 이 시간 동안 이용 가능한 GPS 측정치는 있지만, 그 관측치와 관련된 [선점]이나 [세그먼트] 요소는 없다는 것을 표시하기 위해 점선이 사용됩니다.

체크박스가 선택되면 [이동] 세그먼트는 [연속] 세그먼트로 바뀌게 되고, [연속] 세그먼트가 Timeline에 나타나게 됩니다. [이동] 세그먼트를 이용할 수 있는 유일한 방법은 [연속] 세그먼트를 [이동] 세그먼트로 바꾸는 것입니다.

추가 지침

선점 및 데이터 세그먼트로 작업을 할 때는 다음 지침을 참조 하시기 바랍니다:

  해당 선점이나 데이터 세그먼트를 두 번 클릭하면 선점과 데이터 세그먼트에 관한 모든 등록 정보를 볼 수 있습니다.

  직사각형의 왼쪽과 오른쪽 가장자리를 끌어서 타임스팬(time span)을 직접 조정할 수 있습니다.

  [선점/데이터 세그먼트 등록 정보] 대화 상자로부터 적당한 세그먼트 형식을 선택함으로써 [Static 선점]을 [연속] 세그먼트 또는 [이동] 세그먼트로 바꿀 수 있습니다.

  [선점]과 [세그먼트]는 삭제할 수 있습니다. 그러나 한번 삭제가 되면 프로젝트에서 다시는 이용할 수 없습니다.

  [이전] 명령과 [다음] 명령은 도구 모음에서 청색 화살표 단추로 나타납니다. 이 명령들은 활성 데이터 폴더에 있는 다음 또는 이전의 선점 및 세그먼트의 시작 및 끝 포인트로 [타임스팬뷰어]를 이동하는 데 사용됩니다.


     위성 아이콘

추가 정보

방법...	대화 상자	기타
[위성 아이콘]은 측량 할 때GPS 측정치를 송신한 위성을 나타냅니다. 위성의 인식을 위하여 각각의 아이콘에 위성 PRN 번호가 나타납니다.

Timeline이 처음 나타날 때는 [위성 아이콘]이 보이지 않습니다. 위성 아이콘을 보이게 하려면 제어표시줄에서 하나 또는 그 이상의 데이터 폴더를 열면 됩니다.

마이너스 표시는 폴더가 열렸다는 뜻입니다.
	위성 아이콘
제어표시줄에 있는 위성 아이콘은 [타임스팬뷰어]에 나타나는 GPS 관측치와 1:1의 상관 관계를 가집니다.  아이콘에는 해당 위성 번호가 나타나며 GPS 관측치에는 해당 위성이 방송 활동을 한 기간이 나타납니다.

아이콘 중 어느 하나에 마우스 오른쪽 단추를 클릭하면 명령들을 가진 메뉴가 나타납니다. [타임스팬뷰어]에 나타나는 관련된GPS 관측치를 '이용' 또는 '불이용' 상태로 만들려면 [이용/불이용] 명령을 사용합니다. 이 기능은 선점으로부터 위성 정보를 제거하고자 할 때 유용합니다. '불이용' 상태를 선택하면 '불이용' 상태임을 표시하기 위하여 해당 위성 추적 플롯이 엷은 회색으로 칠해집니다. 이 명령을 또 한번 선택하면, 추적 정보가 다시 '이용' 상태로 변합니다. 위성의 양호 상태에 문제가 있을 때에 이 명령을 사용합니다. 예를 들어, 기선 처리 결과가 향상되는지를 파악하기 위하여 선택한 위성을 '불이용' 상태로 만들고자 할 때 사용할 수 있습니다.

팁: GPS 관측치의 일부를 선택하여 '불이용' 상태로 만들 수 있습니다. 예를 들어, 무효 위상 데이터나 사이클 슬립을 포함하는 영역을 '불이용' 상태로 만들 수 있습니다. 더 자세한 정보를 원하면 GPS 관측치를 참조 하시기 바랍니다.

[위성 아이콘]을 두 번 클릭하면 위성으로부터 수집한 원시 위성 추적 정보를 플롯 하는 명령들이 있는 위성 플롯 창이 나타납니다. [위성 플롯] 창을 이용하면 원시 위성 데이터를 표 형식으로 된 파일로 내보내기 작업을 할 수도 있습니다.

데이터 폴더 내에서 위성 아이콘을 끌어 새로운 위치로 옮김으로 [위성] 아이콘의 위치를 재조정 할 수 있습니다. 이것은 GPS 관측치 등록 정보를 편집하기 전에 여러 개의 위성을 선택하고자 할 때 유용합니다.


    Static 선점

추가 정보

방법...	대화 상자	기타
Static 선점은 수신기가 한 포인트에서 데이터를 수집하는 동안 정지 상태로 있는 시간의 길이를 나타냅니다. 수집된 정보는 포인트의 정확한 위치와 데이터가 수집된 시간을 알려 줍니다.

Static 선점은 파란색의 큰 직사각형으로 나타납니다. 직사각형의 길이는 데이터가 수집된 시간의 길이를 나타냅니다. 스테이션 아이콘이 선점의 앞쪽 모서리에 나타나며 선점이 정지되어 있었음을 나타냅니다.

Static 선점 등록 정보를 보려면 Static 선점에 두 번 클릭합니다. 이 등록 정보는 세그먼트 및 안테나 정보를 보여줍니다.

[Static 선점] 요소 안에서 어디든지 마우스 오른쪽 단추를 클릭하면 [선점 데이터]에 대한 명령들을 가진 메뉴가 나옵니다.

타임스팬을 변경하기 위하여 [Static 선점] 요소를 조정할 수 있습니다. Static 선점은 선점/데이터 세그먼트 등록 정보 대화 상자에 있는 [선점 형식] 목록으로부터 적절한 형식을 선택함으로써 [연속] 세그먼트 또는 [이동] 세그먼트로 바꿀 수 있습니다.

[그래픽] 창과 Timeline이 서로 연결되어 있으므로 [그래픽] 창에서 선택한 포인트와 기선의 선점은 Timeline에서 선택 되고, 그 반대도 마찬가지 입니다. 예를 들어, Timeline에서 Static 선점을 선택하면 [그래픽] 창에서도 해당 포인트와 기선이 선택됩니다. 포인트와 기선이 일단 선택 되면 그 등록 정보를 통해 선점에 대한 자세한 내용을 살펴볼 수 있습니다.

하나의 선점을 선택하면 해당 선점 또는 세그먼트 기간 동안의 위성군 정보를 가진 두 개의 플롯이 화면에 출력될 수 있습니다. 더 자세한 정보를 원하면 다음 항목을 참조하시기 바랍니다:

  DOP 플롯

  하늘 플롯

팁: [그래픽] 창에서 이용 가능한 등록 정보 창은 선택된 선점을 찾기 위하여 Timeline을 통해 탐색할 때도 유용합니다. 이 대화 상자에서 선택한 기선과 포인트의 선점은 Timeline에서도 선택되어 집니다. 일단 선택을 한 후, 그 등록 정보를 보려면 Timeline에 있는 선점 요소를 두 번 클릭하면 됩니다.

[선점]과 [세그먼트] 요소는 쉽게 알아보기 위하여 색상으로 구별되는 직사각형으로 표시됩니다. 더 자세한 정보를 원하면 선점 색상 코드 구성표를 참조하시기 바랍니다.


     [측량] 요소

추가 정보

방법...	대화 상자

[타임스팬뷰어] 에는 한 개 또는 그 이상의 직사각형 모양의 [측량] 요소가 있습니다. 이 [측량 요소]는 제어 표시줄에 나타나는 데이터 폴더와 연결되어 있습니다. 각 데이터 폴더는 한 개의 수신기를 대표하며 한 개 또는 그 이상의 측량치를 포함하고 있으며, 이는 기본적으로 GPS 측정치 파일들로 구성됩니다.

[측량] 요소의 앞쪽 가장자리는 [측량] 세션이 시작된 시간을 말해주고 뒤쪽 가장자리는 측량 세션이 끝난 시간을 말해 줍니다. 제어 표시줄의 데이터 폴더 안에 하나의 [측량] 요소만 있을 경우에는 그 [측량] 요소가 Timeline의 전체 길이를 차지합니다. 그러나 여러 날에 걸쳐 수집한 많은 [측량치]가 한 프로젝트에 포함 될 수 있으므로 일반적으로 하나의 [측량] 요소는 전체 Timeline에서 작은 일부분을 차지하게 됩니다.

[측량] 요소를 두 번 클릭하면 측량 등록 정보가 나타나며 이를 편집할 수 있습니다.

[측량] 요소 안에서 어디든지 마우스 오른쪽 단추를 클릭하면 [측량] 데이터에 대한 명령들을 가진 메뉴가 나타납니다.

[측량] 요소는 삭제할 수 있습니다. 측량 요소는 실제 데이터를 나타내므로 그와 연결된 데이터도 프로젝트에서 삭제됩니다. 삭제된 측량 요소는 [타임스팬뷰어]에서 검정 색 테두리를 가진 흰색 직사각형 영역으로 나타납니다. 이 영역은 Timeline에 측량 데이터가 한 때 존재했었다는 사실을 알려줍니다.


    Timeline 요소 - 개요

추가 정보

방법...	기타
개요

Timeline은 [타임스팬뷰어]에 표시되는 GPS 측량 데이터를 표시하기 위하여 그래픽 요소를 사용합니다.

	데이터 폴더	측량	위성 궤도력 아이콘
	위성 아이콘	선점	GPS 관측치
이 요소를 선택하여 그와 연결된 데이터 등록 정보를 편집할 수 있습니다. 필요한 경우에는 수집된 데이터의 타임스팬을 편집하고, 선택된 위성 추적 정보를 '불이용' 상태로 만들고, 또 선점이나 측량 요소를 삭제할 수도 있습니다. 이 요소들에 수행된 모든 작업은 그와 연결된 프로젝트 데이터에 영향을 줍니다. 이러한 작업으로 GPS 관측치의 전반적인 질에 영향을 미치는 문제성 데이터를 제거하여 측량 데이터의 질을 향상시킬 수 있습니다.

요소 [툴팁 ] 보기

마우스의 포인터를 각 Timeline 요소 위에 위치시키면 다음과 같은 [툴팁]이 나타납니다:

포인터의 위치	[툴팁]이 보여주는 정보
측량 요소	요소와 관련된 데이터 파일의 이름
선점 또는 데이터 세그먼트 요소	선점과 관련된 스테이션의 이름
GPS 관측치	추적 정보와 관련된 우주 운반체 번호
[위성 궤도력] 아이콘	위성 궤도력 업데이트와 관련된 우주 운반체 번호
위성 아이콘 또는 데이터 폴더	수신기 모델과 일련 번호

이 요소들과 관련된 더 자세한 정보를 원하면 다음 항목을 참조하시기 바랍니다:

  측량

  선점

  스테이션 아이콘

  GPS 관측치

  위성 궤도력 아이콘

  이벤트 아이콘


    Timeline 도구 모음

추가 정보

 기타

Timeline 영역이 화면에 나타나면 두 개의 도구 모음 즉, Timeline 도구 모음과 [플롯 계획] 도구 모음이 나타납니다. 이 두 개의 도구 모음은 자주 사용되는 Timeline명령을 손쉽게 이용할 수 있게 해줍니다.

Timeline 도구 모음에 대해 더 아시려면 다음 항목을 참조하시기 바랍니다:

  Timeline 도구 모음

  플롯 계획 도구 모음


    Timeline 보기 영역 - 개요

추가 정보

방법...	기타
개요

Timeline은 GPS 측정치를 가진 한 개 또는 그 이상의 파일을 Trimble Geomatics Office 소프트웨어 프로젝트로 가져온 후에 사용할 수 있습니다. 또한 [측량] 화면에서 작업을 하고 있어야 합니다.

Timeline을 이용하려면:

1.	원시 GPS 데이터 파일을 포함하고 있는 프로젝트를 엽니다.

2.	다음 중 한 가지를 실시합니다.

  보기 / Timeline을 선택합니다.

  Alt+VI를 누릅니다.

Timeline 보기 영역이 [그래픽] 창의 아래 부분에 나타납니다.

Timeline은 세 개의 보기 영역으로 나뉘어져 있습니다:

	시간자 (Time Ruler)
제어 표시줄	타임스팬뷰어
이 세 개의 영역은 상호 연결되어 있습니다. 시간자(Time Ruler)는 [타임스팬뷰어]에 나타나는 시간과 관련 측량 정보를 제어하며, 제어 표시줄은 [타임스팬뷰어]에 나타나는 원시 위성 정보의 양을 제어합니다.

[타임스팬뷰어]는 돋보기라고 생각하시면 됩니다. 그것은 Timeline 전체를 볼 수도 있고 Timeline의 작은 스팬이 있는 곳으로 이동하거나 확대/축소 할 수도 있습니다. Timeline은 [타임스팬뷰어]에 나타나는 정보를 확대/축소하고 이동하기 위한 몇 가지 옵션을 제공합니다. Timeline과 [그래픽] 창이 또한 상호 연결 되어 있으므로 [그래픽] 창에서 선택된 데이터는 [타임스팬뷰어]에서도 선택됩니다.

Timeline을 작동하면 두 가지의 변화가 일어납니다. 추가 도구모음을 이용할 수 있게 되며 상태 표시줄에 Timeline 정보가 나타납니다.

[Timeline 보기 영역]은 가로 방향 또는 세로 방향으로 인쇄 될 수 있습니다. 더 자세한 정보를 원하면 [Timeline 보기 영역] 인쇄 를 참조하시기 바랍니다.

Timeline에 대해 더 알아 보려면 다음 항목을 참조하시기 바랍니다:

  도구 모음

  시간자

  제어 표시줄

  타임스팬뷰어

  Timeline 요소


     시간자(Time Ruler)

추가 정보

방법...	대화 상자	기타
[시간자]와 [타임스팬뷰어]는 상호 연결되어 있어서 하나와 같이 행동을 합니다. 타임 스팬에 어떤 변화가 일어나면 양쪽 창에 동시에 반영됩니다.

[시간자]와 [타임스팬뷰어]는 돋보기라고 생각하면 됩니다. [타임스팬뷰어]에 있는 Timeline의 선택된 영역을 확대/축소하거나 그 부분으로 이동시켜 볼 수 있습니다. Timeline은 여러 시간에서 여러 날에 이르기까지 스팬(span)할 수 있고 많은 선점을 포함할 수도 있습니다. 이 두 개의 창은 전체 Timeline을 보거나 Timeline의 짧은 기간을 볼 때에도 함께 행동합니다. 한쪽 창에 변화가 일어나면 다른 창에도 반영됩니다.

	시작 시간 필드	정지 시간 필드
	시간자
필요에 따라 [시작 시간]과 [정지 시간] 필드를 편집할 수도 있고, [타임스팬뷰어]를 확대/축소할 수도 있습니다. 다음과 같은 작업을 할 수 있습니다:

 일정 기간 동안 수집한 관측 데이터를 자세히 검사할 필요가 있을 때는 [타임스팬뷰어]를 확대/축소하기 위하여 [시작 시간]과 [정지 시간]을 편집합니다. 예를 들어, 높은 관측치 잔차로 인하여 기선 해가 거부된 기간을 확대해 보기를 원할 때 이를 이용할 수  있습니다.

  특정 Timeline 요소를 확대하여 보고자 할 때는 스팬 범위 보기명령을 사용합니다. 예를 들어, [타임스팬뷰어]를 가득 채우도록 [연속 Kinematic 세그먼트]를 확장 시키고자 할 때 이를 사용할 수 있습니다.

  [타임스팬뷰어]에 있는 전체 Timeline을 보고싶을 때는 전체 보기 명령을 사용합니다. 하나의 프로젝트에 여러 개의 데이터 파일이 있을 경우, 측량 데이터가 수집된 다양한 [타임 스팬]을 상호 연관시켜 보고자 할 때 이 명령이 유용합니다.

  [타임스팬뷰어]에 데이터를 200%로 확대하여 보고자 할 때는 확대 명령을 사용합니다. 위성 추적 방송이나 사이클 슬립에 있는 간격을 보기 위하여 GPS 관측치의 작은 부분을 확대 하여 보고자 할 때 이 명령이 유용합니다.

 [타임스팬뷰어]에 데이터를 50% 배율로 축소하여 보고자 할 때는 축소 명령을 사용합니다. GPS 관측 영역을 더 많이 볼 필요가 있을 때 이 명령을 사용합니다. 이 명령은 위성을 '불이용' 상태로 만들 것인 지 여부를 결정하려고 할 때 유용합니다. 즉, 어떤 위성을 '불이용' 상태로 만들려면 위성군에 충분한 여분의 위성이 있는지 알아 보아야 하기 때문입니다. [축소]를 선택하면 타임스팬 동안 몇 개의 위성이 추적되었는지를 보여줍니다.

  이전 배율로 돌아가 보고자 할 때는 직전 배율 명령을 사용합니다. 이 명령은 선점이나 GPS 관측치로부터 확대/축소를 한 후 이전의 배율로 돌아가려고 할 때 유용합니다.

[시간자]는 두 종류의 시간 단위로 나타낼 수 있습니다:

  [윈도우]의 로컬시간

  [GPS 주/초] 시간

시간 표시 단위를 바꾸려면 시간 옵션 대화 상자를 이용하면 됩니다. 달력의 날짜나 시계의 시간과 같은 일상적인 시간 단위와 연결시키고자 할 때는 [윈도우]  로컬 시간을 사용합니다. 타임 스팬을GPS 이벤트나 데이터와 연결시키고자 할 때는 [GPS 주/초]를 사용합니다. 마우스 클릭 몇 번으로 시간 단위를 손쉽게 바꿀 수 있습니다.

시간 단위의 변화는 모든 Timeline [등록 정보] 대화 상자와 각종 화면 출력에 반영 됩니다.

[시간자]에 마우스 오른쪽 단추를 클릭하면 시간자로 작업할 수 있는 명령들이 있는 메뉴가 나옵니다.

더 자세한 정보를 원하면 다음 항목을 참조하시기 바랍니다:

  도구 모음

  제어 표시줄

  타임스팬뷰어

  Timeline 요소

  [Timeline 등록 정보] 대화 상자

  Timeline 표시


     스테이션 아이콘

방법...	기타
작은 빨간색 삼각형 아이콘과 라벨은 Static 선점을 표시합니다.

참조: [스테이션 아이콘]은 삭제하거나 '불이용' 상태로 만들 수 없습니다. 즉, 모 선점이 삭제되거나 '불이용' 상태가 될 때만 함께 삭제되거나 '불이용' 상태가 됩니다.


     이벤트 아이콘

추가 정보

방법...	기타
이 아이콘은 측량 데이터 로깅 세션동안 시스템에 의해, 또는 수작업에 의해 생성된 이벤트를 표시합니다. 이벤트 아이콘은 [타임스팬뷰어]에만 나타나며 이벤트가 일어난 시간에 다이아몬드 모양으로 표시됩니다.

이벤트 아이콘을 보이게 하거나 숨기기 위하여 [이벤트] 아이콘을 제어할 수 있습니다. 그렇게 하려면 Timeline 도구 모음에서 [image] 을 클릭합니다.


     Timeline 메뉴 - 개요

추가 정보

개요

Timeline 보기 영역 안에서 관련 명령을 손쉽게 이용하려면 Timeline 메뉴를 사용합니다. Timeline 요소나 창을 선택한 후 마우스 오른쪽 단추를 클릭하면 해당 메뉴가 나타납니다.

이용할 수 있는 메뉴들은 다음과 같습니다:

  시간자

  타임스팬 필드

  데이터 폴더

  GPS 관측치

  타임스팬뷰어

  측량

  선점

  위성 아이콘

  위성 궤도력 아이콘


     시간자 메뉴

추가 정보

 기타

시간자 명령을 손쉽게 이용하려면 이 메뉴를 사용합니다:

그 기능을 이용하려면 다음 중 하나의 방법을 선택합니다:

  [시간자] 배경을 두 번 클릭합니다.

  [시간자] 배경을 마우스 오른쪽 단추로 클릭합니다.

그렇게 하면 다음의 명령들을 가진 메뉴가 나옵니다:

  시간 옵션

  전체 보기

  직전 배율


     [타임스팬 필드] 메뉴

추가정보

 기타

[타임 스팬 필드] 명령들을 손쉽게 이용하려면 이 메뉴를 사용합니다.

그 기능을 이용하려면:

  [시작 시간]이나 [정지 시간]  스팬 필드를 마우스 오른쪽 단추로 클릭 합니다.

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  실행 취소

  잘라내기

  복사

  붙여넣기

  삭제

  모두 선택


     [제어 표시줄] 메뉴

추가 정보

 기타

[제어 표시줄] 명령을 손쉽게 이용하려면 이 메뉴를 사용합니다. 이 기능은Timeline 영역이 화면에 출력된 상태에서만 이용할 수 있습니다.

이 기능을 이용하려면:

  제어 표시줄에서 어디든지 마우스의 오른쪽 단추를 클릭합니다.

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  모두 개방

  모두 수축

  전체 보기

  직전 배율


     [위성 아이콘] 메뉴

추가 정보

기타

[위성 아이콘] 명령을 손쉽게 이용하려면 이 메뉴를 사용합니다.

이 기능을 이용하려면:

 위성 아이콘에서 마우스 오른쪽 단추를 클릭 합니다 .

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  이용/불이용

  위성 플롯


     [타임스팬뷰어] 메뉴

추가 정보

 기타

[타임스팬뷰어] 명령을 손쉽게 이용하려면 이 메뉴를 사용합니다.

이 기능을 이용하려면:

  [타임스팬뷰어] 배경에 마우스 오른쪽 단추를 클릭합니다 .

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  보기 필터

  다음

  이전

  전체 보기

  직전 배율


     [측량] 메뉴

추가 정보

 기타

[측량 간격] 명령들을 손쉽게 이용하려면 이 메뉴를 사용합니다.

이 기능을 이용하려면:

  [측량] 요소에 마우스 오른쪽 단추를 클릭합니다.

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  삭제

  위성 궤도력 정보

  스팬 범위 보기

  전체 보기

  직전 배율

  등록 정보


     [Static 선점] 메뉴

가 정보

 기타

[Static 선점] 명령들을 손쉽게 이용하려면 이 명령을 사용합니다.

참조: 이 메뉴를 이용하려면 [Static 선점]이 [타임스팬뷰어]화면에  출력되어 있어야 합니다. 먼저, Timeline을 살펴보고, 다음으로 선점 데이터를 가지고 있는 데이터 폴더 를 열면 됩니다.

이 기능을 이용하려면:

  [Static 선점] 요소에서 마우스 오른쪽 단추를 클릭합니다.

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  삭제

  위성 궤도력 정보

  스팬 범위 보기

  전체 보기

  직전 배율

  등록 정보


     [GPS 관측치] 메뉴

추가 정보

 기타

[GPS 관측] 명령들을 손쉽게 이용하려면 이 메뉴를 사용합니다.

이 기능을 이용하려면:

  GPS 관측치 요소나 GPS 관측치 영역 주위에 있는 선택 직사각형에서 마우스 오른쪽 단추를 클릭합니다.

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  이용/불이용

  위성 궤도력 정보

  스팬 범위 보기

  전체 보기

  직전 배율

  등록 정보


     [위성 궤도력] 메뉴

추가 정보

 기타

위성 궤도력 정보 명령들을 손쉽게 이용하려면 이 메뉴를 사용합니다.

이 기능을 이용하려면:

1.	필요하면 데이터 폴더를 엽니다.

폴더가 열리면서 [위성] 아이콘이 나타납니다.

2.	필요하면 [위성] 필터를 켭니다.

[GPS 관측치]가 나타나고, 자동으로 [위성] 필터가 켜집니다.

3.	필요하면 [위성 궤도력] 필터를 켭니다.

[위성 궤도력] 아이콘이 나타납니다.

4.	원하는 [위성 궤도력] 아이콘에 마우스 오른쪽 단추를 클릭합니다.

그렇게 하면 다음과 같은 명령들을 가진 메뉴가 나옵니다:

  스팬 범위 보기

  전체 보기

  직전 배율

  등록 정보


     데이터 폴더

추가 정보

방법...	대화 상자	기타
하나의 [데이터 폴더]는 하나의 수신기를 대표하며, 수신기의 종류와 일련 번호가 폴더에 기록되어 나타납니다. [측량] 프로젝트는 두 개 또는 그 이상의 [데이터 폴더]를 가지게 되며, 프로젝트에 사용된 각 수신기마다 각각 하나 씩 폴더를 가지게 됩니다.

각 [데이터 폴더]는 하나 또는 그 이상의 [측량]에 대한 정보를 가지고 있습니다. 하나의 [측량]은 GPS 측정치가 있는 하나의 파일에 해당합니다.

데이터 폴더를 열거나 닫으면 제어 표시줄에 위성 아이콘이 나타나거나 보이지 않게 되며 [타임스팬뷰어]에는 해당 위성 아이콘과 관련된 GPS 관측치가  나타나거나 보이지 않게 됩니다.

플러스 표시는 폴더가 닫혀있음을 의미합니다.
	수신기 모델과 일련 번호
마이너스 표시는 폴더가 열려있음을 의미합니다.

	위성 아이콘

데이터 폴더를 열고 닫을 때 다음과 같이 두 가지 방법을 사용합니다:

  데이터 폴더가 닫혀 있을 때는 플러스 기호(+)가 데이터 폴더의 왼쪽에 나타나며, 열려 있을 때는 마이너스(-) 기호가 나타납니다. 개별 폴더를 열고 닫으려면 플러스(+)와 마이너스(-) 기호에서 마우스를 클릭하면 됩니다.

  [제어 표시줄]에 있는 데이터 폴더 전체를 열고 닫으려면, 모두 개방명령과 모두 수축 명령을 사용하면 됩니다. 이 명령은 몇 가지 방법으로 이용할 수 있습니다.

데이터 폴더가 열리면 측량에 GPS 관측치를 보낸 개별 위성 하나에 하나의 위성 아이콘이 나타납니다. 각 아이콘마다 위성 추적 플롯으로 표시되는GPS 관측치가 [타임스팬뷰어]에 나타납니다.

  1 주파 관측치의 경우에는 L1 반송파 신호의 위성 추적 정보가 [타임스팬뷰어]에 플롯되어 일련의 픽셀로 나타나게 됩니다.

  2 주파 관측치의 경우에는 L1과L2 반송파 신호의 위성 추적 정보가 [타임스팬뷰어]에 플롯되어 평행의 두 줄 픽셀로 나타납니다.

[데이터 폴더]에 마우스 단추를 두 번 클릭하면 수신기 등록 정보가 나타납니다. 이 폴더에 마우스 오른쪽 단추를 클릭하면 폴더에 있는 데이터로 작업할 수 있는 명령들을 가진 메뉴가 나옵니다.

데이터 폴더가 열릴 때 나타나는 [위성 아이콘]과 [GPS 관측치]에 여러 가지 작업을 수행할 수 있습니다. [타임스팬뷰어]와 [제어 표시줄]에 나타나는 다양한 Timeline 요소에 관한 설명은 Timeline 요소 를 참조하시기 바랍니다.


     Timeline 제어 표시줄

추가 정보

방법...	대화 상자	기타
[타임스팬뷰어]에 나타나는 GPS 관측치 정보를 관리하기 위하여 [제어 표시줄]을 사용합니다.

[제어 표시줄]은Timeline 보기 영역의 왼쪽 하단에 있습니다. [제어 표시줄]에서 수행하는 작업 내용은 [타임스팬뷰어]에 반영됩니다.

[제어 표시줄]로부터 다음의 작업들을 수행할 수 있습니다:

  데이터 폴더를 열고 닫기

  위성  아이콘과 그와 관련된 GPS 관측치를 이용/불이용으로 만들기

  수신기 등록 정보 보기

  개별 위성이 전송한 원시 위성 추적 정보를 보여주는 위성 플롯 불러오기

현재Timeline에서 보고 있는 데이터와 관련된 명령들을 이용하려면 제어 표시줄 메뉴를 사용하면 됩니다. [위성 아이콘] 메뉴는 개별 위성과 관련된 GPS 관측치를 이용/불이용으로 만들고자 할 때 사용하며, 또한 [위성 플롯]을 화면에 출력하고자 할 때도 사용합니다. [위성 플롯] 화면에는 개별 위성의 원시 위성 추적 정보를 볼 수 있는 여러 옵션이 있습니다.

더 자세한 정보를 원하면 다음 항목을 참조하시기 바랍니다:

  도구 모음

  시간자

  타임스팬뷰어


     [연속] 세그먼트 메뉴

추가 정보

 기타

[연속] 세그먼트 명령을 손쉽게 이용하려면 이 메뉴를 사용합니다.

참조: 이 메뉴는 [타임스팬뷰어]에 [연속] 세그먼트가 출력되어 있어야 사용할 수 있습니다. 먼저 Timeline을 살펴보고, 그 다음 연속 데이터를 가지고 있는 데이터 폴더를 엽니다.

이 기능을 이용하려면:

  연속 세그먼트에 마우스 오른쪽 단추를 클릭 합니다.

다음과 같은 명령들을 가진 메뉴가 나타납니다.

  삭제

  위성 궤도력 정보

  스팬 범위 보기

  전체 보기

  직전 배율

  등록 정보


     Timeline 도구 모음

추가 정보

 기타

Timeline이 나타나면 다음의 도구 모음이 도구 모음 영역에 나타납니다.

Timeline이 시작되면 이 도구 모음이 자동으로 나타납니다. 이 도구 모음을 숨기려면 보기 / 도구 모음 / Timeline을 선택하면 되고, 이 명령을 되풀이 하면 도구 모음이 다시 나타납니다.

다음의 단추들을 사용할 수 있습니다:

	적색 직사각형 모양의 스테이션 아이콘과 선점과 관련된 라벨을 필터하기 위하여 이 단추를 선택합니다. [스테이션]은 [타임스팬뷰어]에서 선점요소의 앞쪽 가장자리나 시작 포인트에 나타납니다. [스테이션] 아이콘에 마우스를 두 번 클릭하면, 해당 스테이션의 선점 등록 정보가 스테이션의 요약 정보와 함께 나타납니다.
	[타임스팬뷰어]에 나타나는 다이아몬드 모양의 이벤트 아이콘을 필터하기 위하여 이 단추를 선택합니다.
	연속 세그먼트를 필터하기 위하여 이 단추를 선택합니다. 이 세그먼트는 이동 수신기에 의해 수집되며 초기에는 연결된 스테이션이 없습니다. 세그먼트를 숨기려면 이 단추를 한 번 클릭하고, 다시 나타내려면 또 한번 클릭합니다.
	위성이 수집한 GPS 관측치를 필터하기 위하여 이 단추를 선택합니다. 모든 GPS 관측치를 숨기려면 이 단추를 한 번 클릭하고, 다시 나타내려면 또 한번 클릭합니다.
	[타임스팬뷰어]에 있는 위성 궤도력 아이콘을 필터하기 위하여 이 단추를 선택합니다. 아이콘을 보이게 하려면 단추를 한 번 클릭하고, 숨기고 싶으면 다시 한 번 클릭합니다.
	제어 표시줄에 닫혀져 있는 모든 데이터 폴더를 열기 위하여 이 단추를 선택합니다. 이 단추를 누르면 데이터 폴더 안에 있는 모든 위성 관련 [위성] 아이콘과 GPS 관측치가 보입니다.
	제어 표시줄에 열려져 있는 모든 데이터 폴더를 닫기 위하여 이 단추를 선택합니다. 이 단추를 누르면 데이터 폴더에 있는 모든 위성 관련 위성 아이콘과 GPS 관측치가 감추어 집니다.
	직전의 [측량] 요소로 [타임스팬뷰어]를 이동하기 위하여 이 단추를 선택합니다. 데이터 폴더가 선택되어 있을 때만 이 단추를 사용할 수 있습니다. 이 단추를 누를 때 마다 직전의 [측량] 요소가 선택됩니다. 이 단추는 특히 스크롤바를 사용하지 않고 [측량]에서 [측량]으로  신속하게 이동할 때 유용합니다.
	이 단추는 [타임스팬뷰어]에서 다음 [측량] 요소로 이동하기 위하여 선택합니다. 데이터 폴더가 선택되어 있을 때 만 이 단추를 사용할 수 있습니다. 이 단추를 누를 때마다 다음 [측량] 요소가 선택됩니다. 이 단추는 특히 스크롤바를 사용하지 않고 [측량]에서 [측량]으로  신속하게 이동할 때 유용합니다.


     플롯 계획 도구 모음

추가 정보

 기타

이 도구 모음은 원시 위성 및 방송 위성 궤도력 정보를 표시하는 명령을 실행하기 위하여 사용됩니다.

Timeline이 시작되면 이 도구 모음이 자동으로 나타납니다. 이 도구 모음을 숨기려면 보기 / 도구 모음 / Timeline플롯을 선택하면 되고, 이 명령을 되풀이 하면 도구 모음이 다시 나타납니다.

다음과 같은 단추들을 이용할 수 있습니다:

	DOP 플롯을 보기 위하여 이 단추를 선택합니다. 이 단추는 하나의 선점을 선택한 후에만 사용할 수 있습니다.
	어떤 선점의 하늘 플롯을 보기 위하여 이 단추를 선택합니다. 이 단추는 하나의 선점을 선택한 후에만 사용할 수 있습니다.
	선택된 위성의 위성 플롯을 보기 위하여 이 단추를 선택합니다. 이 단추는 데이터 폴더에서 위성 아이콘을 선택한 경우에만 사용할 수 있습니다.


     타임스팬(Time Span) 편집 필드

추가 정보

방법...	기타
[타임스팬뷰어]를 일정한 [타임스팬]으로 이동하고자 할 때 [시간자]에 있는 [시작 시간]과 [정지 시간] 필드를 사용합니다.

일정 시간 동안의 관측치 데이터를 조사하기 위하여 [타임스팬뷰어]를 이동하고자 할 때 [시작 시간]과 [정지 시간]을 편집합니다. 예를 들어 Timeline에서 특정한 스테이션이 있는 [타임스팬]으로 이동하고 싶을 때 이용할 수 있습니다.

이 필드를 편집하는 동안 이 필드에 마우스 오른쪽 단추를 클릭 하면 메뉴가 나타나고, 이 메뉴에 있는 클립보드 명령을 이용하여 텍스트를 잘라내고, 복사하고, 붙이고, 실행을 취소할 수 있습니다.


     위성군 플롯 - 개요

추가 정보

방법...	기타
개요

Timeline은 위성군에 대한 정보를 그래픽으로 표시합니다. 이 정보는 선점 시간의 현재 위성 궤도력 정보에 기초를 두며, 다음과 같은 그래픽 정보를 가집니다:

  DOP 플롯

  하늘 플롯

선점 요소를 선택한 경우에만 이 그래픽 정보를 이용할 수 있습니다.  위성 가시도가 계산된 포인트 좌표를 얻기 위해서는 먼저 선점이 있어야 합니다.


     DOP 플롯

추가 정보

방법...	기타
위성의 수를 표시하고, 또 관측 스팬 동안 위성 기하에 기초한 GPS 위치의 질에 대한 기대값인 Dilution of Precision (DOP)을 보고자 할 때 DOP 플롯을 사용합니다. 이 표시를 도출하는데 사용되는 정보는 선점 시간의 현재 위성 궤도력 정보 입니다.

선점의 DOP 플롯을 보려면, 다음 중의 한가지를 실행합니다:

  Timeline에서 해당 선점을 마우스 오른쪽 단추로 클릭한 후 메뉴에서 [위성 궤도력 정보 / DOP 플롯]을 선택합니다.

  [플롯 계획] 도구 모음에서 [image] 을 클릭합니다.

그렇게 하면 DOP 플롯이 표시됩니다.

DOP는 위성군 기하의 질의 정도를 표시하는 스칼라(scalar) 값입니다. DOP 값이 적다는 것은 기하구조가 양호 하다는 것을 의미하고, DOP 값이 크다는 것은 기하 구조의 정확도가 떨어 진다는 것을 말합니다. 일반적으로, 보이는 위성이 더 많을 수록 DOP는 적어지고 기하 구조의 정확도는 커집니다. [위성 플롯의 수]는 관측 스팬에 관계되는 보이는 위성의 수를 나타냅니다.

하루 중의 측정시간 및 사용자의 위치는 DOP에 영향을 줍니다. 적은 값의 DOP를 얻을 수 있고 양호한 위성 기하 구조를 얻을 수 있는 시간대를 계획 소프트웨어를 사용하여 예측할 수 있기 때문에 하루 중 관측하기에 가장 좋은 시간을 계획할 수 있습니다.

참조: 위성의 수와 DOP 계산은 선점 시간의 현재 위성 궤도력에 기초를 둡니다. 이 표시는 반드시 실제 추적 상황을 반영하는 것은 아닙니다. 따라서 실제 추적된 것 보다 많은 위성을 보여줄 수도 있습니다. 추가로 보여지는 이러한 위성들은 DOP 플롯을 작성할 당시에는 고려되지 않은 현장의 장애물에 기인 한 것일 수도 있습니다.


     하늘 플롯

추가 정보

방법...	참조
선택한 위치에서 볼 수 있는 위성군의 로컬 이차원 (수평) 플롯을 보려면 이 보기를 사용합니다. 하늘 플롯을 도출하는데 사용되는 정보는 선점 시간의 현재 위성 궤도력 정보 입니다.

하늘 플롯 표시를 보려면, 다음 중의 한가지를 실행합니다:

  Timeline의 선점 요소를 마우스 오른쪽 단추로 클릭하여 [위성 궤도력 정보 / DOP 플롯]을 선택합니다.

  [플롯 계획] 도구 모음에서 [image] 을 클릭합니다.

하늘 플롯의 로컬 지평선은 방위각 및 앙각으로 표시됩니다.

위성 추적 데이터를 상태 표시줄에서 보고자 하면 마우스 커서를 플롯 위로 이동합니다. 마우스 커서에서 가장 근접한 위성을 찾아 해당 데이터 포인트의 시간, 방위각, 앙각을 상태표시줄에 표시해 줍니다.

선점이 시작될 때는 데이터 포인트 주위에 작은 사각형들을 가진 상태로 초기 위성군이 하이라이트 됩니다. 이 시간 포인트의 위성 수와 DOP가 표시됩니다. 이 데이터는 업데이트 할 수 있습니다.

참조: 하늘 플롯은 선점 시점의 현재 위성 궤도력에 기초를 둡니다. 이 표시는 반드시 실제 추적 상태를 반영하는 것은 아닙니다. 그러므로 실제 추적된 이상의 위성을 보여줄 수 도 있습니다. 추가로 보여지는 이러한 위성은 DOP 플롯을 작성할 당시에는 고려되지 않은 장애물에 기인된 것일 수 있습니다.


     Timeline 내용

내용

다음과 같은 도움말 항목을 이용할 수 있습니다:

Timeline을 사용하는 방법에 대해서 알고 싶으시면 다음 항목들을 참조하시기 바랍니다.

  Timeline을 사용하는 경우 및 목적

  Timeline 보기 영역

  Timeline 요소

  [Timeline 데이터 등록 정보] 대화 상자

  Timeline 메뉴

  [Timeline] 명령

  Timeline 위성 및 위성 궤도력 표시

도움말에 대한 도움말을 보려면 F1을 누릅니다.


    Timeline - 개요

추가정보

대화 상자	기타
개요

Timeline은 GPS 프로젝트 정보(Trimble 수신기 또는 데이터 수집기에 의해 수집된 원시 위성 정보 및 측량 정보)를 그래픽과 시간 개념으로 표시합니다. 각 정보는 Timeline 상의 해당 위치에 그래픽 요소로 표시됩니다. Timeline은 측량 보기에서만 이용할 수 있습니다.

Timeline을 보려면:

  [보기 / Timeline]을 선택합니다.

Timeline을 사용하여 다음 작업을 실행할 수 있습니다:

  위성 관측치의 상세한 플롯 보기

  선택된 위성 데이터를 '불이용' 상태로 만들기

  의사 (擬似) GPS 관측 데이터를 선별적으로 편집

  요소와 관련된 데이터 등록 정보 편집

  기선 처리에 사용된 선점 시간의 조정

일단 Timeline이 나타나면, 그래픽 요소를 선택하여 그 요소와 관련된 데이터를 검사, 점검, 편집할 수 있습니다.

추가 정보는 다음 항목을 참조하시기 바랍니다:

  Timeline을 사용하는 경우 및 목적

  Timeline 보기 영역

  Timeline 요소

  [Timeline 데이터 등록 정보] 대화 상자

  Timeline 위성 및 위성 궤도력 표시


     Timeline을 사용하는 경우 및 목적

추가 정보

방법…	대화 상자	기타
Timeline을 사용하여 GPS 프로젝트 정보를 검사, 점검, 편집할 수 있습니다. GPS 원시 데이터 파일을 Trimble Geomatics Office 소프트웨어 프로젝트로 전송한 다음 Timeline을 사용할 수 있습니다. 기선 처리 전에 파일에 수집된 GPS 데이터를 검사하거나 안테나 정보를 편집하고자 할 때 Timeline을 사용합니다. Timeline은 기대하지 않은 결과가 기선 처리 후 생성되었을 경우 특히 유용합니다. Timeline을 사용하여, 문제가 있는 데이터를 찾아낸 다음 편집 함으로서 그 질을 향상시킬 수 있습니다.

Timeline을 사용하여 GPS 측량정보를 검사하고 다음과 같은 상태를 점검합니다:

  위성 신호 사이클 슬립 및 그 이외의 신호 문제

  불량한 위성 양호 상태

  위성군의 여유도가 좋지 않은 상태

  DOP 기간이 좋지 않은 상태

  안테나 측정 문제

  여러 측량 데이터 파일 간의 시간 문제

Timeline을 사용하여 다음과 같은 시행 착오 테스트를 실행합니다:

  데이터 수집 타임 스팬을 조정

  위성 추적 정보를 불이용 상태 및 이용 상태로 변경

데이터 질을 향상시키려면 다음의 Timeline명령을 사용합니다:

  선점 시간 조정

  양호하지 않은 위성을 불이용 상태로 만들어 전체 관측 잔차를 향상시킴

  의사 (擬似) GPS 관측치 데이터를 선별적으로 편집

  문제가 있는 선점을 기선 처리에서 제거

  문제가 있는 측량 데이터를 기선 처리에서 제거

Timeline은 하나의 데이터 폴더에 단일 수신기가 수집한 GPS 측정치를 가진 모든 파일을 보관합니다. 또한 측량 요소를 사용하여 각 GPS 측정치 파일의 정보를 표시합니다. 각 수신기 마다 별도의 데이터 폴더를 가지고 있고, 동일 수신기에서 수집된 모든 측량 요소는 한 줄로 표시됩니다.

데이터가 기록된 타임 스팬 동안의 측량 요소가 표시됩니다. 각 수신기의 데이터 폴더를 열어 추가 정보를 볼 수 있습니다. 이 추가 정보는 측량하는 동안 수집된 모든 데이터를 나타내줍니다.

마우스를 사용하여 타임 스팬 뷰어 를 탐색한 다음 데이터 등록 정보를 보거나 편집할 요소를 선택합니다. Timeline 위성 정보 및 위성 궤도력 표시를 사용하여 아주 자세히 데이터를 보거나 편집할 수 있습니다.

Timeline을 사용하는 중에도 계속 그래픽 창에서 작업할 수 있습니다. 이 두 보기는 서로 연결되어 있습니다 � 한 보기 영역에서 데이터를 선택하거나 변경 시 다른 보기 영역에서도 동일하게 선택되고 변경 됩니다. 이 두 보기를 함께 사용하는 방법은 Timeline 요소 선택 및 편집을 참조하시기 바랍니다.


     Timeline 요소 선택 및 편집

추가 정보

방법…	대화 상자	기타
그래픽 창과 Timeline은 서로 연결되어 있기 때문에, 다음과 같은 작업이 가능합니다:

  Timeline에서 선점 요소를 선택하여 그래픽 창에서 선택된 포인트를 봅니다.

  그래픽 창에서 기선을 선택하여 Timeline에서 강조된 기선을 구성하는 선점 세그먼트를 봅니다.

  그래픽 창에서 포인트를 선택하여 Timeline에서 강조된 관련 세그먼트를 봅니다.

참조: [종속 기선 보기]가 이용 상태로 되어 있을 경우, Timeline 화면에 나타나 있는 관측치만 그래픽 창에 표시됩니다. 이것은 독립 기선을 선택할 때 유용합니다. [종속 기선 보기]를 이용 상태로 만들려면:

1.	[보기 / 필터]를 선택합니다. [보기 필터] 대화 상자가 나타납니다.

2.	[Timeline을 이용하여 종속 GPS 기선 표시] 옵션을 선택하고 확인을 클릭합니다.

플롯 계획 도구 모음을 사용하여 다음과 같은 상세한 플롯 및 그래프를 표시합니다:

  스테이션 선점의 위성 플롯 DOP 및  위성 플롯의 갯수

  스테이션 선점의 위성 하늘 플롯

  세션의 원시 위성 추적 신호 플롯

이러한 플롯 및 그래프를 사용하여 다음 작업을 실행합니다:

  표시된 데이터의 타임 스팬을 변경

  여러 개의 보기 화면을 열어 다양한 형식으로 정보를 보기

  창의 크기를 조절 및 재배치하여 데이터 검사

  플롯 및 그래프의 인쇄

플롯 및 그래프는 아래에 설명되어 있습니다.

요소 선택

Timeline 요소 또는 그 해당 프로젝트 데이터를 선택하는 데 관련된 동작에는 다섯 가지가 있습니다.

  요소와 관련된 데이터를 선택하려면 요소를 한번 클릭합니다

  요소의 정보 등록 정보를 보려면 요소를 두 번 클릭합니다

  요소에 작용하는 명령의 메뉴를 보려면 요소를 마우스 오른쪽 단추로 클릭합니다

  요소의 등록 정보를 보기 전에 또는 요소와 관련된 데이터를 불이용 상태로 만들거나 삭제하기 전에, 한 개 또는 그 이상의 요소 주위를 선택 직사각형으로 끌어 그리기를 합니다

  요소를 무작위로 선택하려면 Shift또는 Ctrl 을 누른 채로 마우스를 클릭합니다

요소를 선택하는 것은 요소와 관련된 프로젝트 데이터를 선택하는 것과 같습니다.

실행 취소 명령

Trimble Geomatics Office 소프트웨어의 [실행 취소] 명령을 사용하여 요소 삭제, 또는 요소를 불이용 상태로 만들기와 같은 몇 가지 Timeline 명령을 취소 할 수 있습니다. Timeline 요소를 불이용 상태로 만들었거나 삭제 하였을 경우 그것의 원래 요소 상태는 클립보드에 저장되어 있습니다. [실행 취소] 명령을 선택 함으로서 삭제 또는 불이용 명령을 역으로 되돌릴 수 있습니다.

참조: 다른 명령에 의해 클립보드 데이터가 덮어 쓰였을 경우에는 삭제 또는 불이용 동작을 [실행 취소] 할 수 없습니다.

[실행 취소] 명령은 [시작 시간] 및 [정지 시간] 필드 명령을 편집할 때도 이용할 수 있습니다. 한 필드로부터 텍스트를 잘라내거나 복사하여 다른 필드에 붙여 넣기를 할 수 있습니다.

요소 툴팁 읽기

마우스 포인터를 Timeline 요소 위에 위치시켰을 때 다음과 같은 툴팁이 나타납니다.

포인터의 위치	툴팁이 보여주는 정보
측량 요소	요소와 관련된 데이터 파일 이름
선점 또는 데이터 세그먼트 요소	선점과 관련된 스테이션 이름
GPS 관측치	추적 정보와 관련된 우주 운반체 번호
위성 궤도력 아이콘	위성 궤도력 업데이트와 관련된 우주운반체 번호
위성 아이콘 또는 데이터 폴더	수신기 모델 번호 및 일련 번호


     위성 추적 정보 편집

추가 정보

방법…	대화 상자	기타
[GPS 관측치 등록 정보] 대화 상자를 사용하여 위성 관측치의 스팬을 편집하고 이 편집된 사항을 기선 처리에 적용합니다. 하나 또는 그 이상의 위성에 대한 위성 신호의 다양한 관측치 종류를 편집 할 수 있습니다. 예를 들어 하나 또는 여러 위성에 대하여 암호화 된 L2관측치를 불이용 상태로 만들 수 있습니다.


     Timeline 명령 - 개요

다음 네 가지 방법 중 하나 또는 그 이상의 방법을 사용하여 다양한 Timeline 명령을 실행할 수 있습니다.

  Timeline 영역 및 요소를 두 번 클릭

  Timeline 영역 및 요소를 마우스 오른쪽 단추로 클릭하여 메뉴를 표시한 다음, 명령 옵션 중의 한가지를 선택

  도구 모음 단추를 클릭

  키를 순서대로 누름

모든 명령이 이 네 가지 방법을 모두 지원하는 것은 아닙니다.

다음과 같은 명령들을 이용할 수 있습니다:

  연속

  복사

  잘라내기

  삭제

  DOP 플롯

  이용/불이용

  위성 궤도력

  위성 궤도력 정보

  이벤트

  모두 개방

  붙여넣기

  등록 정보

  위성

  모두 선택

  모두 수축

  하늘 플롯

  위성 플롯

  Timeline

  시간 옵션

  실행 취소

  보기 필터

  확대

  축소

  전체 보기

  직전 배율

  스팬 범위 보기

위성 플롯에서는 이외에도 추가적인 명령을 이용할 수 있습니다.


    [Timeline 등록 정보] 대화 상자 - 개요

추가 정보

방법...	대화 상자	기타
개요

대부분의 측량 데이터 편집은 [등록 정보] 대화 상자를 사용하여 실행합니다. 그러나 선점 및 세그먼트의 [시작 시간] 및 [정지 시간] 필드와 같은 Timeline 필드는 [등록 정보] 대화 상자 뿐만 아니라 시간자를 사용하여서도 편집할 수 있습니다. 마우스를 사용하여 데이터를 불이용 상태로 만들거나 삭제하는 Timeline명령도 데이터를 편집하는 또 하나의 방법입니다.

[등록 정보] 대화 상자를 불러오는 방법에는 다음 두 가지가 있습니다:

  요소를 두 번 클릭합니다.

  요소를 마우스 오른쪽 단추로 클릭한 후 메뉴에서 [등록 정보]를 선택합니다.

[Timeline 등록 정보] 대화 상자는 확인 또는 취소를 클릭할 때 까지 열려있습니다. 확인을 클릭하기 전까지 어떠한 변경된 사항도 저장 되지 않습니다. 한번에 여러 개의 [등록 정보] 대화 상자를 열어 여러 요소의 다양한 등록 정보를 비교할 수 있습니다. 예를 들어, 동시에 두개 또는 그 이상의 요소에 대한 [등록 정보] 대화 상자를 볼 수 있습니다.

다음과 같은 [등록 정보] 대화 상자를 이용할 수 있습니다:

  수신기 등록 정보

  측량 등록 정보

  선점/데이터 세그먼트 등록 정보

  GPS 등록 정보

  위성 궤도력 등록 정보

참조: 위성 아이콘은 [등록 정보] 대화 상자를 가지고 있지는 않지만, 위성 플롯 을 불러와 측량에 데이터를 제공한 각 위성의 원시 추적 정보를 플로팅, 인쇄, 및 내보내기를 실행할 수 있습니다. 이 플롯은 GPS 관측치에 방송 활동의 갭(gap)이 발견될 때 원시 위성 추적 정보를 검사하는데 유용합니다.


     Timeline 표시 - 개요

추가 정보

방법…	기타
개요

Timeline은 측량 동안 수집된 위성 추적 정보 및 위성 궤도력 정보에 관한 더 상세한 정보를 볼 수 있는 추가 표시를 포함하고 있습니다. 이 표시는 선점에 대해 수집한 데이터 및 각 위성에 대해 수집한 GPS 관측치를 추가로 검사하는 도구로 사용될 수 있습니다.

다음과 같은 추가 표시를 이용할 수 있습니다:

  위성 관측치 표시

  위성 궤도력 정보 표시

상기 항목에는 각 표시에서 플로팅 된 정보를 분석하는 지침이 포함되어 있습니다. 데이터를 좀더 확실하게 분석하려면 이 지침을 이용하시기 바랍니다.


     기선 해

추가 정보

 기타

기선 해에는 다섯 가지가 있으며, 그에 대한 설명은 다음 부분을 참조하시기 바랍니다:

  유동해

  고정해

  광역 고정해

  협역 고정해

  전리층 무영향 해


     유동해

추가 정보

 기타

기선 처리기가 모호 정수 항에 대한 명확한 정수 값을 계산 할 수 없을 때 유동 해가 얻어 집니다. 기선 처리 중 1000.60과 같은 모호 정수가 계산되는데 이 값은 정수 값에 근접하지 않기 때문에 이 값을 1000 또는 1001로 결정할 수가 없습니다. 이와 같은 이유 때문에 기선 처리기는 가장 근접한 정수 값으로 이 값을 설정할 수가 없습니다. 이 모호 정수를 실제 값으로 사용하여 기선 구성 요소를 계산합니다. 이러한 기선 해는 고정 해 만큼 정확하지는 않습니다.

유동 해는 모델링 되지 않은 대기 오류, 궤도 오류, 그 이외의 다른 오류 때문에 발생합니다.


     고정 해

추가 정보

 기타

기선 처리기가 모호 정수 항에 대해 다른 해에 비해 질이 월등히 좋은 정수 값을 찾을 경우 고정 해가 얻어집니다. 기선 처리기는 모호 정수 값을 정수로 설정하여 최종 기선 구성 요소를 계산합니다. 실시간 측량에서는 [Fine] 이라는 작동 모드가 있는데 이것은 고정 정수 해를 의미합니다.

1.  주파수 수신기의 경우 이상적인 해는 일반적으로 이중차(double difference) 고정 정수 해입니다.

2.  주파수 수신기에서는 다양한 방법으로 반송파 위상 관측량을 결합시켜 몇 가지의 다른 고정 해를 생성할 수 있습니다.


     광역 고정해

추가 정보

 기타

광역이란 L1과 L2 반송파 위상 관측량을 조합하여 사용하는 과정을 지칭합니다. 반송파 위상 관측량 간의 차 (L1−L2)를 구하여 광역 반송파 위상을 구합니다. 효과적인 광역 파장은 86.2 센티미터입니다.

이러한 관측치 조합을 사용하면 보다 쉽게 정수 모호성을 찾을 수 있습니다. 따라서 대부분의 경우 긴 기선 해를 구할 때 광역이 사용됩니다.


     협역 고정해

추가 정보

 기타

협역이란 L1 및�L2 반송파 위상 관측량을 조합하여 사용하는 과정을 지칭합니다. 두개의 반송파 위상 관측량을 더하여 (L1+L2) 협역 반송파 위상을 구합니다. 효과적인 협역 파장은 10.7 센티미터입니다. 이 협역은 GPS 측량 관측치 상의 전리층 영향을 제거하는데 매우 효과적입니다.


     전리층 무영향 해

추가 정보

 기타

전리층 무영향 해는L1 및 L2 반송파 위상의 조합을 사용하여 GPS 신호의 전리층 영향을 모델링하고 제거합니다. 전리층 무영향  해는 높은 수준의 제어 측량에 자주 사용 되고 특히 긴 기선을 관측할 때 사용됩니다.


     신호 강도

신호대 잡음비 (SNR) 라고도 부르는 위성의 신호 강도는 신호가 가지는 잡음에 대한 정보량을 의미합니다. 이 비율이 감소함에 따라 잡음으로 인해 정보가 유실됩니다. 이 신호 수준이 증가함에 따라 신호의 질이 상승됩니다 (예를들어, 14의 신호 수준은 8의 신호 수준보다 우수합니다). 30� 각도에서 위성의 일반적인 L1 신호 수준은 12에서 20사이 입니다. 20 이상의 L1값은 매우 우수한 경우입니다. 위성군에서 한 위성의 L1 신호 수준이 6 이하일 경우, 그 데이터의 질은 좋지 않습니다. 낮은 신호 수준은 내비게이션 하기에는 적당한 위치를 제공하지만 측량하는데는 좋지 않습니다. L2의 SNR 은 L1의 SNR 보다 낮을 경우가 많이 있습니다. 따라서 데이터 잡음을 평가할 때에는 L1 신호 강도에 비중을 두어야 합니다.

GPS 위성 신호는 비교적 약합니다. 실제로 많은 경우에 배경 잡음이 GPS 신호보다 더 강합니다. 위성의 신호 강도가 특별히 약할 경우 이 관측치로부터 계산된 위치는 정확하지 않은 경향이 있습니다.

신호가 약한 데는 일반적으로 두 가지가 이유가 있습니다. 첫째, 신호가 무성한 나무 같은 장해물을 통과 한 후 안테나에 도달 하였을 경우입니다. 이러한 경우에는 수신기를 하늘이 잘 보이게 설정함으로써 문제를 해결할 수 있습니다. 둘째, 수평선 상의 낮은 위치에 있는 위성은 일반적으로 머리 위쪽에 위치한 위성보다 약한 신호를 가지고 있습니다.

낮은 앙각의 위성을 사용하면 다중 경로 오차 (GPS 신호가 반사되기 때문에 발생한 오차) 가 발생할 수 있습니다. 낮은 앙각 위성 때문에 발생하는 문제를 피하려면, 측량 시 반드시 권장 임계 앙각을 사용하시기 바랍니다. 대부분의 후처리 측량과 실시간 측량은 13° 의 임계 앙각을 가집니다. 위성 앙각이 10°이하인 경우의 위성 데이터는 거의 저장하지 않습니다.


     Dilution of Precision (DOP)

DOP는 GPS위치의 질을 나타내는 지표입니다. 해당 위치의 정확도를 예측하기 위해 위성군에 있는 다른 위성들에 대한 각 위성의 상대적 위치(기하)를 계산한 값입니다. 낮은 값의 DOP는 강한  위성 기하 를 말하고 정확도가 높다는 것을 의미합니다. 높은 DOP는 약한 위성 기하를 말하고 정확도가 낮다는 것을 의미합니다.

일반적으로 계산되는 DOP 종류에는 다음과 같은 것들이 있습니다.

  RDOP − 상대 위치 오차

  PDOP − 수평 및 수직 측정치 (위도, 경도, 고도)

  HDOP − 수평 측정치 (위도, 경도)

  VDOP − 수직 측정치 (고도)

  TDOP − 시계 옵셋

양호한 기선을 결정하는 데는 PDOP 만으로 충분하지 않지만, 위성군의 정확도를 전체적으로 가장 잘 표시해주는 것이 PDOP입니다. 4 또는 그 이하 값의 PDOP는 아주 좋은 위치를 생성합니다. 5 와 7 사이의 PDOP 값은 괜찮으나, 7 이상 값은 좋지 않습니다. 수신기의 임계 PDOP를 설정하여 설정한 한계보다 높은 PDOP 값을 가지고 있는 위성군을 무시할 수 있습니다. Trimble 측량 수신기의 기본 임계 PDOP 는 7입니다. 이 임계 PDOP는 위치 결정에만 영향을 미치고 다음 기선 처리에는 큰 영향을 미치지 않습니다.

QuickPlan 프로그램을 이용하여 현장 관측을 하는 동안 PDOP를 계산할 수 있습니다. 원하는 위치와 날짜를 입력하여 위성의 눈에 보이는 정도 및 기하 구조를 예측할 수 있습니다.


     기선 처리 로그 - 개요

개요

기선 처리기는 기선 해를 분석하는데 유용한 정보를 가진 로그 파일을 생성합니다.

이 파일은 "처리로그.html"의 파일 이름을 가지며 각 프로젝트의 보고서\기선 폴더 내에 위치합니다. 처리로그.html 파일의 내용은HTML뷰어나 웹 브라우저를 사용하여 볼 수 있습니다.

이 로그 파일은 각 GPS 처리 세션마다 만들어 집니다. 이전 로그 파일의 이름을 변경하지 않았을 경우, 새 처리 세션이 시작될 때 마다  이전 로그 파일은 새 로그 파일로 덮여 쓰여집니다. 기선 처리기는 처리 결과에 영향을 주는 경고 및 오류를 이 파일에 기록합니다.

기선 처리 중 어떠한 경고나 오류가 이 파일에 기록된 경우에는 처리가 완전히 종료 된 후 이 파일의 내용을 볼 수 있도록 하나의 대화 상자가 나타납니다. 이 때 볼 수 있는 내용은 프로젝트 등록 정보 / 일반탭에서 정한 [오류보고]의 설정에 따라 다릅니다. 이 로그 파일에는 하나 또는 그 이상의 다음과 같은 오류 또는 경고가 포함 될 수 있습니다.

오류

  기선 미해결

기선 <기점이름> -> <대상점이름> 미해결

  처리 세그먼트는 OTF 처리를 위한 충분한 데이터를 가지고 있지 않습니다

처리 세그먼트 (<GPS주> <GPS주초>)는 OTF 처리를 위한 충분한 데이터를 가지고 있지 않습니다.  세그먼트 길이 = <지속시간>

  Kinematic 세그먼트 초기화 실패

Kinematic 세그먼트 초기화 실패.  세그먼트: <GPS주> <GPS주초> -> <GPS주> <GPS주초>

  고정 기선 초기화 실패

고정 기선 초기화 실패

  Static 기선 초기화 실패

Static 기선 초기화 실패

  Kinematic 해 실패

<파일이름> 키네메틱 해 실패. 시작: <GPS주> <GPS주초>    정지: <GPS주> <GPS주초>

  스탑앤고 해 실패

<PointName> 스탑앤고 해 실패.

경고

다음과 같은 경고가 있을 수 있습니다.

  기선에 중복 해가 있습니다

이 세션에서 기선에 중복 해가 있습니다. 하나만 저장되게 됩니다.

  정밀 위성 궤도력이 없음

<기점이름> -> <대상점이름> <GPS주> <GPS주초>에 대한 정밀 위성 궤도력이 없음, 방송 이용 중


     기선 미해결

이 오류는 다음과 같은 형식을 가지고 있습니다:

기선 <기점이름> -> <대상점이름> 미해결

<기점> 및 <대상점>은 프로젝트의 포인트 이름이고 기선을 인식하는데 사용됩니다.

기선 미해결 오류가 발생하면 이 기선의 기대 해는 GPS 처리 목록에서 빠집니다.


     처리 세그먼트는 OTF 처리를 위한 충분한 데이터를 가지고 있지 않습니다

이 오류는 다음과 같은 형식을 가지고 있습니다:

처리 세그먼트 (<GPS주> <GPS주초>)는 OTF 처리를 위한 충분한 데이터를 가지고 있지 않습니다. 세그먼트 길이 = <지속시간>

<GPS주> 및 <GPS주초>는 OTF 처리에 실패한 세그먼트의 시작 시간입니다. Timeline을 사용하여 해당 GPS 관측치를 보는데 이 시간을 사용할 수 있습니다.

<지속시간>은 OTF 처리에 실패한 GPS 측정치에 의해 스팬된 시간입니다.

이 오류가 발생하면 기선 처리기는 OTF 초기화를 수행할 수 없습니다. 이는 하나 또는 그 이상의 Kinematic 기선 해의 실패의 원인이 될 수 있으며, GPS 처리 목록에서 하나 또는 그 이상의 기대 기선 해가 빠지는 결과를 초래할 수 있습니다.


     Kinematic 세그먼트 초기화 실패

이 오류는 다음과 같은 형식을 가지고 있습니다:

Kinematic 세그먼트 초기화 실패. 세그먼트: <GPS주> <GPS주초> -> <GPS주> <GPSW주초>

<GPS주> 및 <GPS주초>는 Kinematic 초기화에 실패한 세그먼트의 시작 및 정지 시간입니다.  Timeline을 사용하여 해당 GPS 측정치를 보는데 이 시간을 사용할 수 있습니다.

이 오류가 발생하면 기선 처리기는 Kinematic 초기화를 수행할 수 없습니다. 이는 하나 또는 그 이상의 Kinematic 기선 해의 실패의 원인이 될 수 있으며, GPS 처리 목록에서 하나 또는 그 이상의 기대 기선 해가 빠지는 결과를 초래할 수 있습니다.


     고정 기선 초기화 실패

이 오류는 다음과 같은 형식을 가지고 있습니다:

알려진 측점 초기화 실패

이 오류가 발생하면 기선 처리기는 알려진 측점으로부터 Kinematic 초기화를 수행할 수 없습니다. 이는 하나 또는 그 이상의 Kinematic 기선 해의 실패의 원인이 될 수 있으며, GPS 처리 목록에서 하나 또는 그 이상의 기대 기선 해가 빠지는 결과를 초래할 수 있습니다.


     Static 기선 초기화 실패

이 오류는 다음과 같은 형식을 가지고 있습니다:

스태틱 기선 초기화 실패

이 오류가 발생하면 기선 처리기는 스태틱 선점으로부터 Kinematic 초기화를 수행할 수 없습니다. 이는 하나 또는 그 이상의 Kinematic 기선 해의 실패의 원인이 될 수 있으며, GPS 처리 목록에서 하나 또는 그 이상의 기대 기선 해가 빠지는 결과를 초래할 수 있습니다.


     Kinematic 해 실패

이 오류는 다음과 같은 형식을 가지고 있습니다:

<파일이름> Kinematic 해 실패. 시작: <GPS주> <GPS주초>  정지: <GPS주> <GPS주초>

<파일이름>은 Kinematic 해에서 사용된 GPS 측정치를 가지고 있는 파일의 이름입니다.

<GPS주> 및 <GPS주초>는 Kinematic 해에 실패한 세그먼트의 시작 및 정지 시간입니다. Timeline을 사용하여 해당GPS 측정치를 보는데 이 시간을 사용할 수 있습니다.

이 오류가 발생하면 이 기선의 기대 해는 GPS 처리 목록 에서 빠지게 됩니다.


     스탑앤고 해 실패

이 오류는 다음과 같은 형식을 가지고 있습니다:

<포인트이름> 스탑앤고 해 실패.

<포인트이름>은 스탑앤고Kinematic 해에 실패한 포인트의 이름입니다.

이 오류가 발생하면 이 기선의 기대 해는 GPS 처리 목록 에서 빠지게 됩니다.


     기선에 중복해가 있습니다

이 경고는 다음과 같은 형식을 가지고 있습니다:

이 세션에서 <기선ID> 기선에 중복 해가 있습니다. 하나만 저장되게 됩니다.

<기선ID>는 프로젝트 내에서 이 기선에 사용된 관측치의 식별자입니다.

이 경고는 사이클 슬립에 의해 스탑앤고 Kinematic 선점이 분할 되었을 때 발생합니다. 각 부분이 두 개 또는 그 이상의 에포크일 경우, 기선 처리기는 이 포인트의 선점이 마치 두개 있는 것처럼 슬립의 양면에 해를 생성합니다.

[중복 기선해 덮어 쓰기] 체크 상자를 선택한 경우, 하나의 해 만 저장됩니다. 기본 설정으로 마지막 해가 저장 됩니다. 그러나 보존하기 원하는 기선 해의 체크 상자는 선택하고, 보존하기 원하지 않는 해의 체크 상자를 해제 함으로서 이를 변경할 수 있습니다.

중복 기선 해는 기선 ID에 의해 식별할 수 있습니다. 두개의 해가 모두 동일 기선 ID를 가지게 됩니다.


     정밀 위성 궤도력이 없음

이 경고는 다음과 같은 형식을 가지고 있습니다:

<기점이름> -> <대상점이름> <GPS주> <GPS주초>에 대한 정밀 위성 궤도력이 없음, 방송 이용 중

<기점> 및 <대상점>은 프로젝트 내의 실제 포인트 이름이고, 기선을 인식하는데 사용될 수 있습니다.

<GPS주> 및 <GPS주초>는 정밀 위성 궤도력이 없는 기선의 시작 시간입니다. 적절한 범위를 위해 정밀 위성 궤도력 파일을 포함하는 프로젝트 폴더를 점검하시기 바랍니다.

이 경고는 정밀 위성 궤도력 처리가 요구되지만 충분한 정밀 위성 궤도력 데이터를 이용할 수 없음을 의미합니다. 이 경고가 발생하면 정밀 위성 궤도력 대신 방송 궤도력이 사용됩니다.