Copyright: �1999-2002 Trimble Navigation Limited. All rights reserved.
Citation: �1999-2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office - 개요
Trimble Geomatics Office − 개요

Trimble Geomatics Office는 GPS(RTK 및 후처리)나 광파/광학 측량기(servo형 및 로봇형), 레벨, 레이저 등 다양한 측량 기법으로 수집한 데이터를 통합하는 기능이 있습니다. 종합적인 QC 도구를 토대로 현장에서 사무실로, 그리고 다시 현장으로 데이터를 보다 신속하고 효율적으로 전송할 수 있습니다.

Trimble Geomatics Office의 용도:

  GPS 기선 처리 (WAVE Baseline Processing 모듈을 설치한 경우)

  측량 망 조정 (Network Adjustment 모듈을 설치한 경우)

  GPS 및 광파 지형 측량 데이터의 처리

  데이터의 QA/QC(Quality assurance/Quality control)

  도로 설계 데이터의 가져오기 및 내보내기

  측량 데이터의 가져오기 및 내보내기

  수치 지형 모델(Digital Terrain Model) 작업 및 등고선 작업

  데이텀 변환과 투영

  GIS 데이터 수집 및 데이터 내보내기

  피쳐 코드 처리

  프로젝트 보고 작업

  측량 프로젝트 관리

주요 기능

Trimble Geomatics Office (버전 1.6)의 주요 기능:

  그래픽 창에서 프로젝트 데이터의 '측량' 보기 및 '평면도' 보기 화면

  자주 쓰는 작업이 메인 그래픽 창의 프로젝트 표시줄에서 바로 가기 형식으로 조직화

  보기 필터를 이용하여 관측치 종류별로 숨기기나 표시하기

  '끌어다 놓기' 기능을 이용하여 작업 파일을 데스크톱에서 프로젝트 영역으로 끌어다 놓기

  GPS 수신기나 광파 토탈 스테이션으로 수집한 데이터의 가져오기

  각종 가져오기 포맷 및 내보내기 포맷을 망라

  가져오기 작업 전에 [DAT 체크인] 대화 상자를 통한 원시 GPS 데이터의 확인과 편집

  등록 정보 창을 이용하여 모든 종류의 관측치는 물론, 포인트의 관련 정보를 전부 보거나 편집

  복수의 개체를 신속히 편집하기 위한 [다중 편집] 대화 상자

  GIS 데이터 수집 지원

  CAD 데이터를 관리하기 위한 레이어 지원

  전문적인 감각으로 구성된 HTML 보고서

  표준형 및 사용자 정의 보고서 포맷

  제3자 도로 설계 파일을 보거나 편집하고 수치 지형 모델(Digital Terrain Model)을 만들기 위한 RoadLink 및 DTMLink 모듈

참조: Trimble Geomatics Office는 8.3식의 파일 이름 체제를 지원하지 않습니다.

모듈

다음은 Trimble Geomatics Office에서 이용할 수 있는 옵션 모듈에 대한 설명입니다.

  WAVE Baseline Processing 모듈은 Static이나 FastStatic, Kinematic 방식으로 수집한 GPS 측량 관측치로부터 기선을 계산합니다 . WAVE 기선 처리기는 기본 처리 작업을 수행함은 물론, 고급 처리 작업에 대한 탄력적인 제어 옵션을 제공합니다. Timeline은 원시 관측치 파일에 있는 GPS 데이터를 시간 기준의 그래픽 포맷으로 표시합니다. 이것을 이용하여 원시 GPS 측정치와 측량 정보를 보거나 편집을 합니다.

  Network Adjustment 모듈은 GPS 측량 데이터나 비GPS 측량 데이터를 조정함으로써 그 내재 오차를 추정하고 감소시킵니다.

Geomatics란?

Geomatics란 공간 정보(Spatial information)의 설계 및 수집, 저장, 분석, 디스플레이, 검색을 말합니다. 이 공간 정보는 GPS나 지상 측량법 등 다양한 방식으로 수집할 수 있습니다. Geomatics는 전통적인 측량법과 현대의 테크놀러지 방식이 통합된 것으로서 무한한 응용 잠재력이 있습니다.


Trimble Geomatics Office 소프트웨어 제거하기
소프트웨어 제거하기

주의: 아래 방식으로 처리할 경우, 공통 파일과 템플리트, 데이터 파일을 제외한 나머지가 모두 제거됩니다. 데이터 파일은 Microsoft Windows 탐색기로써 삭제합니다.

사용자의 시스템에서 Trimble Geomatics Office를 제거하려면

1.	[시작 / 설정 / 제어판]을 실행합니다.

2.	제어판에서 [프로그램 추가/제거]를 선택합니다. [프로그램 추가/제거 등록 정보] 대화 상자가 나옵니다.

3.	[설치/제거] 탭이 활성화 되어 있도록 합니다.

4.	'Trimble Geomatics Office'를 선택합니다.

5.	[추가/제거]를 누릅니다. '파일 삭제를 확인하십시오'라는 메시지가 나옵니다.

6.	[예]를 누릅니다.

해당 파일들이 삭제됩니다.

주의: Trimble Geomatics Office를 제거하면 사용자 정의 포맷을 모두 잃어버리게 됩니다. 예를 들어, 어떤 심벌을 시스템의 심벌 라이브러리(Symbols.sym)에 추가하였거나 사용자 정의 가져오기/내보내기 포맷을 추가하였다면 이들은 모두 없어집니다.

다음 파일은 사용자 정의의 정보를 저장합니다.

  도면 양식 정의 파일 (*.frm) � 이 파일을 텍스트 편집기로 편집하여 사용자 정의

  보고서 포맷 파일 (Asciirpt.dat) � 사용자 정의 파일을 만들 때 사용자 정의

  ASCII 가져오기 정의 파일 (Asciiimp.dat) � 사용자 정의 가져오기 포맷을 만들 때 사용자 정의

  ASCII 내보내기 정의 파일 (Asciiexp.dat) � 사용자 정의 내보내기 포맷을 만들 때 사용자 정의

  시스템의 심벌 라이브러리 (Symbols.sym) � 새 심벌 형식을 이 파일에 저장할 때 사용자 정의

  시스템의 선 형식 라이브러리 (Linetype.ltp) � 새 선 형식을 이 파일에 저장할 때 사용자 정의


폴더 구조

Trimble Geomatics Office의 설치시, 해당 파일이 아래의 각 폴더로 모두 복사됩니다.

폴더	저장 파일
\Program Files\Trimble\ Trimble Geomatics Office	Trimble Geomatics Office 프로그램 파일 및 도움말 파일
...\System	시스템 파일(피쳐 및 속성 라이브러리 파일, Symbol Editor™유틸리티, Type Editor™유틸리티, HTML 보고서 템플리트 등)
...\Template	프로젝트 템플리트 파일
...\Utility	A1 Viewer, Convert to RINEX™, Coordinate System Manager™, Data Transfer, DC File Editor™, Feature and Attribute Editor™, Line Type Editor, Planning , Symbol Editor 유틸리티 등의 링크
...\RoadLink − DTMLink	RoadLink 및 DTMLink의 프로그램 파일과 그 관련 파일
\Program Files\Common쟂iles\ Trimble	Trimble Geomatics Office와 기타 Trimble 제품에서 공통적으로 이용하는 파일
...\GeoData	좌표계 정보와 지오이드 파일
...\GeoDB	Coordinate System Manager 프로그램 파일
...\Data Transfer	Data Transfer 프로그램 파일
...\DatToRinex	Convert to RINEX 프로그램 파일
...\Dceditor	DC File Editor 프로그램 파일
...\Plan	Planning 프로그램 파일


Trimble 안내

Trimble은 지구 측위 시스템(GPS) 테크놀로지 분야에 있어 선두 주자입니다. 고급 GPS 구성요소의 제공 이외에도, 무선 커뮤니케이션 및 소프트웨어는 물론, 여타의 측위 테크놀로지를 토대로 GPS의 영역을 확장하고 완벽한 고객 솔루션을 창조하고 있습니다. Trimble의 새로운 응용 산업 분야로는 측량, 차량 항법, 기계 유도, 자산 추적, 무선 플랫폼, 텔레커뮤니케이션 기간 구조 등 다양합니다.

Trimble의 본사는 645 North Mary Avenue, Sunnyvale, CA, USA에 있습니다. 또한 전세계 여러 나라에 사무소를 두고 고객 여러분에 봉사하고 있습니다.

Trimble의 웹사이트를 방문하시면 보다 자세한 정보를 얻으실 수 있습니다.

www.trimble.com


[인버스] 명령

이 명령을 이용하여 프로젝트 포인트 2 개 사이의 인버스를 결정합니다.

이 명령은 [측량 / 인버스]를 선택함으로써 실행합니다.

[인버스] 대화 상자가 나옵니다.


[인버스] 대화 상자

이 대화 상자를 이용하여 프로젝트 포인트 2 개 사이의 인버스를 결정합니다. 인버스에 대한 정보(간이 또는 상세)를 보거나 보고서를 만들 수도 있습니다.

이 대화 상자를 불러오려면 아래 방법 중 하나를 이용합니다.

  [측량 / 인버스]를 선택합니다.

  F7 키를 누릅니다.

참조: 인버스는 기존 포인트에만 적용됩니다. 기타 다른 좌표 위치 사이의 방위각과 거리를 보려면 '측정' 기능을 이용합니다. 이것은 [측량 / 측정]을 선택하면 됩니다.

시점

키보드로 포인트 이름을 입력하거나, 필드 필인(Fill-in) 기능을 이용하여 포인트를 클릭합니다.

종점

키보드로 포인트 이름을 입력하거나, 필드 필인 기능을 이용하여 포인트를 클릭합니다.

포인터를 다른 포인트 가까이로 이동하면 점선이 나타납니다. 이것은 계산할 인버스를 표시합니다. 그 두번째 포인트를 클릭하면 점선이 실선으로 바뀌게 되는데, 인버스 명세가 표시되는 선은 바로 이 선입니다.

표시 거리가 [프로젝트 등록 정보] 대화 상자의 [단위와 포맷] 탭에서 그리드 거리나 해수면 거리로 설정되어 있고, 그 두 포인트의 표고가 없을 경우에는 그리드 거리와 방위각이 표시됩니다. 하지만 [표시 거리] 필드가 '지상 거리'로 설정되어 있고 두 인버스 포인트의 표고가 모두 공백값이라면, 거리는 공백값으로 표시됩니다(기본값 표고가 공백값으로 설정된 경우). 표고 정보가 없이 지상 거리를 계산하지 못하기 때문입니다.

그리드 방위각

이 필드는 포인트간의 그리드 방위각을 표시합니다.

그리드 거리

이 필드는 포인트간의 그리드 거리를 표시합니다.

델타 표고

두 포인트의 표고가 모두 있을 경우에는 델타 표고가 표시되지만 하나라도 표고가 없으면 이 필드는 공백값으로 나타납니다.

방식

2가지의 인버스 계산 방식이 있습니다.

순차형     일련의 인버스를 하나씩 차례대로 계산

방사형	     일련의 인버스를 공통되는 시작점에서 방사형으로 계산

계산

선택한 포인트를 키보드로써 입력하였다면 [계산] 단추를 눌러 인버스를 계산합니다.

보고서로 보내기

인버스 계산 보고서를 작성하려면 [보고서로 보내기] 단추를 누릅니다. 선택한 표시 옵션 여하에 따라 인버스 보고서가 자세히 또는 간단히 표시됩니다.

참조: 어떤 표시 옵션 하에서 만든 보고서를 다른 표시 모드 하에서 다시 만들 경우, 그 보고서로부터의 인버스 내역이 기존 보고서에 첨가됩니다.

보고서 보기

작성된 인버스 보고서는 [보고서 보기] 단추를 눌러 봅니다.

간이 보고서에서는 [인버스] 대화 상자의 '간단히' 모드 하에서 표시되는 인버스 내역을 볼 수 있습니다.

상세 보고서는 시점과 종점의 위치를 그리드와 로컬(측지), Cartesian(WGS-84) 좌표계에서 표시합니다. 또한 인버스 계산값과, 그 좌표계에서 인버스의 축소 변환에 쓴 매개 변수도 표시합니다.

자세히 / 간단히

[자세히]를 누르면 [상세 명세] 상자가 나옵니다. [상세 명세] 상자가 표시되면 단추가 [간단히]로 바뀌게 됩니다. [간단히]를 누르면 [상세 명세] 상자가 사라집니다.

상세 명세

이 상자는 인버스에 관한 별도의 추가 정보를 표시합니다.

법선면 전방 방위각

이 필드는 첫째 포인트로부터 둘째 포인트까지의 법선면 전방 (측지) 방위각을 표시합니다.

법선면 후방 방위각

이 필드는 둘째 포인트로부터 첫째 포인트까지의 법선면 후방 (측지) 방위각을 표시합니다.

타원체 거리

이 필드는 포인트간의 타원체 거리를 표시합니다.

지상 거리

이 필드는 포인트간의 지상 거리를 표시합니다.

델타 타원체고

이 필드는 포인트간의 델타 타원체고를 표시합니다.


[측정] 명령

이 명령을 이용하여 그래픽 창으로부터 방위각과 거리, 면적을 측정합니다.

이 명령은 [측량 / 측정]을 선택함으로써 실행합니다.

[측정] 대화 상자가 나옵니다.


[측정] 대화 상자

이 대화 상자를 이용하여 그래픽 창으로부터 방위각과 거리, 면적을 측정합니다.

이것은 [측량 / 측정] 명령을 실행함으로써 불러옵니다.

프로젝트의 포인트 사이나 화면상의 위치 사이를 측정할 수 있습니다. (해당 위치를 클릭합니다.)

일단 2개 또는 그 이상의 위치를 선택하면 첫째 포인트와 마지막 위치간의 누적 거리가 [거리] 필드에 표시됩니다. [방위각] 필드는 선택된 마지막 2개 위치 사이의 방위각을 나타냅니다.

팁: 마우스를 클릭해서 끌 경우, 필드에는 현재 방위각, 선택한 첫째 포인트로부터의 누적 거리, 면적이 표시됩니다.

방위각

2개의 위치를 선택하면 그 포인트간의 그리드 방위각이 표시됩니다. 선택한 포인트가 3개 이상이면 이 필드에는 마지막 2개 포인트간의 방위각이 나타납니다.

거리

2개의 위치를 선택하면 그 포인트간의 거리가 표시됩니다. 선택한 포인트가 3개 이상이면 이 필드에는 측정 거리의 총누적 수치가 나타납니다.

총거리는 사용자의 디스플레이 설정 내용에 의거, 보고됩니다.

참조: [프로젝트 등록 정보] 대화 상자의 [표시 거리] 필드가 지상 거리로 설정되어 있다면, 그리고 두 측정 위치 모두의 표고가 공백값이라면, 거리는 공백값으로 표시됩니다(기본값 표고가 공백값으로 설정된 경우). 표고 정보가 없으면 소프트웨어상에서 지상 거리를 계산할 수 없습니다.

면적

3개 이상의 포인트를 선택하면 이들로 형성되는 면적이 표시됩니다.

계산 면적은 표시 거리의 설정 내용에 따라 달라집니다.

  지상 거리로 설정된 경우에는 평균 지상 표고에서 계산된 면적

  해수면 거리로 설정된 경우에는 타원체면에서 계산된 면적

  그리드 거리로 설정된 경우에는 그리드 좌표로부터 계산된 면적

리셋

이 단추를 누르면 모든 필드의 설정이 해제됩니다. 마우스로 시점을 더블 클릭하는 방법으로도 리셋을 할 수 있습니다.

팁:  프로젝트의 어느 정도가 그래픽 창에 표시되어 있는지 신속히 결정하려면 상태 표시줄의 그래픽 창 치수 표시기 [image] 를 보면 됩니다. 이 표시기는 커서를 그래픽 창의 바깥에 두면 볼 수 있습니다.

포인터 [image] 의 이용시 Ctrl 키를 누르면 가까운 포인트로 스내핑(snapping) 되는 일을 막을 수 있습니다.


좌표 변환 - 개요
좌표 변환 − 개요

추가 정보

방법 ...	대화 상자	기타
개요

좌표 변환은 프로젝트에서 포인트를 시프트(shift)시키는 것으로서, 시프트, 회전, 2차원 축척화 등의 작업이 포함됩니다. 기준 등급이나 조정 등급의 포인트는 이동시킬 수 없는데, 만일 이 등급의 포인트를 선택하여 이동시키려고 하면 메시지가 나타납니다.

좌표 변환은 어떤 포인트가 제3자 설계 패키지 하의 프로젝트에서 변형 좌표계를 기준으로 하고 있어 그 정확한 사용 좌표를 얻어야 하는 경우에 이용합니다.

좌표 변환 정의는 다음 방법 중 하나로 합니다.

  필드 필인(Fill-in) 기능을 이용하여 포인트를 클릭한 후, 알려진 그 좌표 값을 입력합니다. 포인트의 수가 4개 이상이면 소프트웨어는 최소 자승법으로써 그 선택 포인트들의 변환 매개 변수를 계산합니다.

  변환 매개 변수를 직접 명시합니다.

좌표 변환을 할 때 해당 포인트에 대한 기타 모든 관측치는 불이용 상태로 됩니다. 변환 포인트의 표시 좌표(그리드, 로컬, WGS-84)는 바뀌지만 그 좌표계는 바뀌지 않습니다.

일단 변환을 실행하면, 원래의 좌표값과 변환된 좌표값이 나오는 보고서를 만들 수 있습니다.


[좌표 변환] 명령

이 명령을 이용하여 수평 변환을 결정, 적용합니다.

이 명령은 [측량 / 좌표 변환]을 선택함으로써 실행합니다.

[좌표 변환] 대화 상자가 나옵니다.


[좌표 변환] 대화 상자

 개요 및 추가 정보

이 대화 상자를 이용하여 수평 변환을 결정, 적용합니다.

이것은 [측량 / 좌표 변환] 명령을 실행함으로써 불러옵니다.

이 대화 상자에 값을 입력하려면 다음 방법 중 하나를 이용합니다.

  [포인트 목록]을 눌러 프로젝트의 포인트(좌표를 아는)들을 선택하고 각각의 포인트에 그 알려진 값을 입력합니다. 소프트웨어에서 변환 매개 변수가 계산되는데, 포인트 값의 수가 4개 이상일 경우에는 최소 자승법이 이용됩니다. 포인트 목록에는 통계가 나오므로 목록에 포인트를 제대로 추가하였는지 판단하는 데 도움이 됩니다. 해당 변환 값은 [좌표 변환] 대화 상자에 나타납니다.

  해당 값을 키보드로써 직접 입력합니다.

좌표 변환을 할 때 해당 포인트에 대한 기타 모든 관측치는 불이용 상태로 됩니다. 변환 포인트의 표시 좌표(그리드, 로컬, WGS-84)는 바뀌지만 그 좌표계는 바뀌지 않습니다.

E 방향 평행 이동

동 방향(양)이나 서 방향(음)으로 평행 이동하는 정도

N 방향 평행 이동

북 방향(양)이나 남 방향(음)으로 평행 이동하는 정도

회전

변환에 적용되는 회전 각도의 정도

축척

변환의 축척 변화

회전 원점

다음 필드들은 회전 중심의 위치를 표시합니다.

포인트	회전 원점으로 쓸 포인트의 이름을 표시합니다. 포인트 이름을 입력하면 [N] 필드와 [E] 필드에 그 좌표가 표시됩니다. '포인트 목록'을 매개 변수의 계산에 이용하는 경우, 이 필드에는 포인트 목록으로부터의 좌표 평균이 나타납니다.
N	원점의 N 좌표 표시
E	원점의 E 좌표 표시
변환

포인트 변환 옵션:

선택 부분	선택된 포인트에 변환을 적용
전체 데이터베이스	프로젝트의 포인트 전부에 변환을 적용
선택된 포인트가 없을 경우에는 이 옵션을 이용할 수 없어, 모든 포인트가 변환되게 됩니다.

좌표 변환 보고서 만들기

원래 좌표와 변환된 좌표의 보고서를 만들고자 하면 이 확인란을 선택합니다. 보고서는 기본 HTML 뷰어에 표시됩니다.

포인트 목록

기준점들을 선택하려면 [포인트 목록]을 클릭합니다. 이 포인트들에 대하여 알려진 값을 입력합니다.

[포인트 목록] 대화 상자가 나옵니다.


[좌표 변환 - 포인트 목록] 대화 상자
[좌표 변환 − 포인트 목록] 대화 상자

 개요 및 추가 정보

이 대화 상자를 이용하여 좌표 변환 매개 변수의 계산에 쓸 포인트를 선택합니다. 사용자가 포인트를 선택하면 Trimble Geomatics Office가 그 현재 좌표를 표시하게 됩니다. 그 다음, 사용자가 알려진 좌표를 입력하면 Trimble Geomatics Office가 변환 매개 변수를 계산한 후, 변환할 포인트에 이를 적용합니다.

이 대화 상자를 불러오려면

1.	[측량 / 좌표 변환] 명령을 실행합니다. [좌표 변환] 대화 상자가 나옵니다.

2.	[포인트 목록]을 누릅니다.

이 대화 상자는 스크롤 형식의 포인트 목록이 있습니다. 각 포인트는 현재 좌표를 표시하는 필드와 알려진 좌표를 표시하는 필드가 있습니다. 포인트 이름을 입력하면 [현재 X 좌표]와 [현재 Y 좌표] 필드가 나옵니다. 그 다음, 알려진 좌표를 [알려진 X 좌표] 필드와 [알려진 Y 좌표] 필드에 입력합니다.

팁: 포인트 이름을 공백으로 두고, 필드 필인(Fill-in) 기능을 이용하여 현재 좌표를 입력할 수도 있습니다.

좌표 변환 계산을 위한 위치 정의의 수에는 제한이 없습니다. 위치 정의를 많이 추가한다고 해서 변환 결과가 항상 좋아지는 것은 아니지만, 계산되는 매개 변수의 타당성을 점검하는 추가 장치로서의 기능을 합니다.

통계

[통계] 상자에는 축척 계수와 최대 수평 잔차가 나옵니다. 이 통계를 이용하면 잘못된 값이 입력되지 않았는지 확인할 수 있습니다.

삽입

공백의 위치 정의 레코드를 삽입하려면 이 단추를 누릅니다. 일반적으로 Trimble Geomatics Office는 새 위치 정의 필드를 자동 추가하므로 [삽입] 단추를 누를 필요성이 그다지 많이 생기지는 않습니다. 하지만 변환 매개 변수의 계산에서 회전 원점으로 쓰이는 것은 '포인트 목록' 상의 첫째 포인트이기 때문에 사용자가 어떤 위치 정의를 목록의 제일 앞에 삽입하고자 할 수 있습니다.

삭제

이것을 누르면 위치 정의를 목록에서 제거할 수 있습니다.


표고 조정 - 개요
표고 조정 − 개요

추가 정보

방법 ...	대화 상자	기타

표고 조정은 포인트의 표고를 조정합니다.

일단 조정이 이루어지면 Trimble Geomatics Office는 다음 중 하나의 방식으로써 그 표고 조정을 적용합니다.

  알려진 표고를 기존 포인트에 대하여 입력하는 경우에는 Trimble Geomatics Office가 표고 조정 매개 변수를 계산합니다.

  상수(양수나 음수)를 입력하는 경우에는 Trimble Geomatics Office가 이것을 선택된 모든 포인트에 적용합니다.

참조: 표고 조정은 그 포인트의 타원체고/표고 질이 기준 등급이나 조정 등급인 경우에는 적용되지 않게 됩니다.

표고 조정 결과

표고 조정을 할 때 해당 포인트에 대한 그리드 위치나 기타 모든 관측치는 불이용 상태로 됩니다. 변환 포인트의 표시 좌표(그리드, 로컬, WGS-84)는 바뀌지만 그 좌표계는 바뀌지 않습니다.

다음은 포인트 목록에 많은 표고가 있을 때 어떤 매개 변수가 계산되는지 설명하는 표입니다.

참조: 계산되는 이 표고 조정은 [측량 / GPS 사이트 캘리브레이션]에서의 수직 조정과는 달리, 좌표계 정의에 포함되지 않습니다.

원래 표고와 조정된 표고, 그리고 그 차이값을 나타내는 보고서를 만들 수 있습니다.


표고 조정 - 개요
[표고 조정] 명령

이 명령을 이용하여 표고 조정을 결정, 적용합니다.

이 명령은 [측량 / 표고 조정]을 선택함으로써 실행합니다.

[표고 조정] 대화 상자가 나옵니다.


표고 조정 - 개요
[표고 조정] 대화 상자

 개요 및 추가 정보

이 대화 상자를 이용하여 표고 조정을 결정, 적용합니다.

불러오는 방법:

  [측량 / 표고 조정] 명령을 실행합니다.

선택된 프로젝트 포인트의 표고를 조정하려면 다음 중 하나의 방식을 이용합니다.

  상수법

  경사면 매개 변수법 (값을 입력하거나 포인트를 선택)

상수

상수 값을 포인트의 표고에 추가하려면 이 옵션을 선택합니다. 이 상수를 선택된 포인트나 전체 프로젝트에 적용합니다.

표고에 추가

'상수' 옵션을 선택하게 되면 [표고에 추가] 필드가 활성화됩니다. 포인트에 추가할 표고 값을 양수나 음수로 입력합니다.

매개 변수

경사면 표고 조정에 대한 매개 변수를 명시하거나 계산하려면 이 옵션을 선택합니다. 매개 변수를 계산하기 위한 기준점을 선택하기 위해서는 [포인트 목록]을 누릅니다.

원점

경사면의 원점으로 쓸 포인트의 이름이 표시됩니다.

참조: 매개 변수 계산을 위한 포인트의 선택에 포인트 목록을 이용하는 경우, 이 필드에는 선택된 첫번째 기준점이 표시됩니다.

원점 E

원점의 E 좌표가 표시됩니다. [원점] 필드에서 어떤 포인트를 선택하는 경우, 이 필드는 선택한 그 포인트의 좌표로써 채워집니다.

원점 N

원점의 N 좌표가 표시됩니다. [원점] 필드에서 어떤 포인트를 선택하는 경우, 이 필드는 선택한 그 포인트의 좌표로써 채워집니다.

보정 상수

원점 위치에서 적용되는 표고 보정치가 표시됩니다.

경사 N

이 값은 경사면의 북-남 방향 경사를 정의합니다. 원점으로부터의 거리(북-남 방향)와 이 PPM(Parts per million) 값을 토대로 표고 조정이 계산됩니다. 보정 상수 이외에 이것도 추가로 적용됩니다.

경사 E

이 값은 경사면의 동-서 방향 경사를 정의합니다. 원점으로부터의 거리(동-서 방향)와 이 PPM 값을 토대로 표고 조정이 계산됩니다. 보정 상수 이외에 이것도 추가로 적용됩니다.

포인트 목록

표고 조정 매개 변수의 계산에 이용할 기준점들을 선택하려면 [포인트 목록]을 클릭합니다. [포인트 목록] 대화 상자가 나옵니다.

조정

조정 적용 옵션 2가지 중 하나를 선택합니다.

선택 부분	선택된 포인트에 조정을 적용
전체 데이터베이스	프로젝트의 포인트 전부에 조정을 적용
선택된 포인트가 없을 경우에는 선택 단추가 비활성화 되어, 프로젝트의 모든 포인트에 조정이 적용되게 됩니다.

표고 조정 보고서 만들기

원래 표고와 조정된 표고의 보고서를 만들고자 하면 이 확인란을 선택합니다. 보고서는 기본 HTML 뷰어에 표시됩니다.


[표고 조정 - 포인트 목록] 대화 상자
[표고 조정 − 포인트 목록] 대화 상자

 개요 및 추가 정보

Trimble Geomatics Office는 이 대화 상자에서 선택된 포인트들을 이용하여 표고 조정 매개 변수를 계산합니다. 사용자는 해당 프로젝트에서 포인트들을 선택하고, 이들에 대하여 알려진 표고를 입력합니다.

이 대화 상자를 불러오려면

1.	[측량 / 표고 조정] 명령을 실행합니다. [표고 조정] 대화 상자가 나옵니다.

2.	[포인트 목록]을 누릅니다.

필드 필인(Fill-in) 기능을 이용하거나 키보드로써 각 기준점을 선택하고 그 알려진 표고를 입력합니다.

팁: 필드 필인 기능을 이용, 화면에서 적당한 포인트를 선택함으로써 좌표 필드와 표고 필드를 채워 넣을 수 있습니다.

일반적으로 3개 이상의 기준점을 입력합니다. 이 기준점들은 조정 중인 포인트들의 주위에 골고루 분포되어야 합니다.

표고 조정 계산에 지정할 수 있는 포인트의 수에는 어떤 한도가 정해져 있지 않습니다. 포인트 정의를 많이 추가한다고 해서 조정 계산 결과가 항상 좋아지는 것은 아니지만, 계산되는 매개 변수의 타당성을 점검하는 추가 장치로서의 기능을 합니다.

통계

[통계] 상자에는 최대 조정 경사와 최대 수직 잔차가 나옵니다. 이 통계를 이용하면 잘못된 값이 입력되지 않았는지 확인할 수 있습니다.

삽입

포인트 정의 레코드를 삽입하려면 [삽입] 단추를 누릅니다. 일반적으로 Trimble Geomatics Office는 새 포인트 정의 필드를 자동 추가하므로 이 단추를 누를 필요성이 그다지 많이 생기지는 않습니다. 하지만 포인트 목록 상의 첫째 포인트가 표고 조정 원점으로 쓰이기 때문에, 사용자가 이 기능을 이용하여 어떤 포인트를 포인트 목록의 제일 앞에 둘 수 있습니다. 그러나 일반적으로 조정 원점에 쓰이는 위치는 그다지 의미 있는 것이 아닙니다.

삭제

이 단추를 누르면 포인트 정의를 목록에서 제거할 수 있습니다.


[실행 취소] 명령

수행한 명령을 취소합니다.

이 명령은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 실행 취소]를 선택합니다.

  <Ctrl+Z>를 누릅니다.

[편집] 메뉴의 [실행 취소] 명령 옆에 나오는 글자는 실행 취소할 작업을 나타냅니다. 실행 취소는 한 번에 하나씩 이루어지는데, 가장 최근의 수행 명령이 먼저 취소됩니다. 실수로 이 명령을 실행하였다면 [재실행] 명령으로 되돌립니다.

프로젝트나 Trimble Geomatics Office를 종료한 경우, 그 종료 전에 수행한 명령은 아무 것도 실행 취소할 수 없습니다.

팁: 수행한 가져오기 명령을 프로젝트 종료 후에 되돌리려면 [포인트 선택] 대화 상자 / [일반] 탭 하의 [출처 조건] 옵션을 이용하여 문제의 항목을 선택한 후, 삭제함으로써 그 가져오기 작업을 실행 취소합니다.


[재실행] 명령

[편집 / 실행 취소]로 취소한 명령을 다시 수행합니다.

이 명령은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 재실행]을 선택합니다.

  <Ctrl+Y>를 누릅니다.

[편집] 메뉴의 [재실행] 명령 옆에 나오는 글자는 재실행할 작업을 나타냅니다.

재실행은 한 번에 하나씩 이루어집니다.

프로젝트를 종료한 경우, 그 종료 전에 수행한 명령은 아무 것도 재실행할 수 없습니다.


[잘라내기], [복사], [붙여넣기] 명령

[잘라내기], [복사], [붙여넣기] 명령을 이용하면 선택 데이터의 이동 및 복사 작업을 편리하게 할 수 있습니다.

[편집] 메뉴에서[잘라내기]나 [복사], [붙여넣기] 명령을 선택합니다.

  [잘라내기]는 선택 항목을 현행 프로젝트로부터 제거합니다.

  [복사]는 선택 항목의 복사본을 만듭니다.

  [붙여넣기]는 선택 항목을 다른 프로젝트나 소프트웨어 프로젝트에 삽입합니다.

잘라내거나 복사한 선택 항목은 클립보드에 보관됩니다. 잘라내기나 복사를 할 때마다 그 직전에 클립보드에 있던 내용은 없어집니다.

[붙여넣기]를 실행한 후에도 그 내용이 계속 클립보드에 남아 있기 때문에 필요한 횟수만큼 여러 번 붙여넣기를 할 수 있습니다.

이 명령 항목들로 할 수 있는 작업:

  프로젝트간의 데이터 전송(예: 프로젝트 사이의 기준점 복사)

  속성이 있는 포인트를 한 프로젝트에서 다른 프로젝트로 복사하고 붙여넣기

  CAD 작업을 보고서에 복사하고 붙여넣기

  데이터를 좌표계가 다른 프로젝트로 복사(예: 좌표계가 NAD-27인 프로젝트의 포인트를 NAD-83 좌표계의 프로젝트에 복사 및 붙여넣기)

복사한 개체는 그 관련 좌표 값을 이용함으로써 프로젝트에 붙여넣습니다. 이것은 대상 프로젝트의 좌표계 정의가 원본 프로젝트와 다를 경우, 그 좌표 값이 새 좌표계로 자동 변환되기 때문에 해당 개체를 정확하게 위치시킬 수 있게 됩니다.

참조: 관측치를 한 프로젝트에서 다른 프로젝트로 복사/붙여넣기를 하려면 반드시 Trimble Data Exchange 포맷을 이용하여야 합니다. Trimble Geomatics Office에서는 관측치를 프로젝트간 복사하고 붙여넣을 수 없습니다.


[삭제] 명령

현재 선택된 개체를 삭제합니다.

이 명령은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 삭제]를 선택합니다.

  [삭제]를 누릅니다.

실행한 [삭제] 명령을 취소하려면,

  [편집 / 실행 취소] 명령을 선택합니다.


[포인트 이름 변경] 명령

포인트의 이름을 변경합니다.

이것은 [편집 / 포인트 이름 변경] 명령을 선택함으로써 실행합니다.

[이름 변경] 대화 상자가 나옵니다.


[이름 변경] 대화 상자

 개요 및 추가 정보

이름은 같지만 물리적으로 동일한 포인트가 아닌 중복 포인트는 [이름 변경] 대화 상자를 이용하여 이름을 변경할 수 있습니다.

예

두 측량자가 각자 작업한 2개의 Survey Controller 파일을 가져오는 경우,

  한 측량자는 1000에서 2000까지의 포인트 이름을 이용했고

  다른 측량자는 1000에서 1050까지의 포인트 이름을 이용했다면

[중복 포인트 옵션] 대화 상자에서 [허용 편차 이내의 중복 포인트 병합] 옵션이 설정되어 있을 때, 데이터베이스에 51개의 중복 포인트(1000에서 1050)가 생깁니다.

가져오기시 [중복 포인트 옵션] 대화 상자에서 [항상 중복 포인트 병합] 옵션이 설정되어 있을 경우에는 어떤 중복 포인트가 병합되었는지 소프트웨어상에 나타납니다. 이 때, 해당 중복 포인트의 이름을 변경하고자 하면 그 가져오기 옵션을 실행 취소한 다음, 이름을 변경합니다.

이름 변경 방법:

  [편집 / 포인트 이름 변경] 명령을 실행하면 [이름 변경] 대화 상자가 나옵니다.

이름 변경

두 가지 옵션이 있습니다.

선택 부분 − 선택한 포인트들의 이름을 바꿉니다.

전체 데이터베이스 −  모든 포인트의 이름을 바꿉니다.

선택한 포인트가 없다면 '전체 데이터베이스' 옵션이 기본값으로 적용됩니다.

팁: .dc 파일로부터 좌표의 이름을 바꾸려면 [포인트 선택] 대화상자를 이용하여 출처로부터 포인트를 선택합니다.

방식

[방식] 상자에는 다음의 옵션이 있습니다.

시작 새 이름

이 옵션을 선택하여 새로 적용할 이름의 첫째 이름을 입력합니다.

참조: 알파벳형의 이름을 입력하면 선택된 포인트들의 새 이름이 모두 같아집니다. 포인트 이름을 증분시키고자 하면 이름의 마지막 문자는 숫자로 하도록 합니다.

접두어 첨가

이 옵션을 선택하여 접두어를 입력합니다. 예를 들어, 이들이 지형점(Topo point)이라는 것을 나타내고자 하면 접두어로 TOPO를 입력할 수 있습니다.

팁: 접두어의 마지막 문자를 스페이스로 하면, 이름이 변경된 포인트와 원래 포인트가 서로 구별되게 됩니다.

접미어 첨가

이 옵션을 선택하여 접미어를 입력합니다. 예를 들어, 측량일(예: 08/10/99)을 표시하고자 하면 날짜 접미어를 첨가합니다.

팁: 접미어의 첫 문자를 스페이스로 하면, 이름이 변경된 포인트와 원래 포인트가 서로 구별되게 됩니다.

상수 합산

선택된 포인트에 양수나 음수의 상수를 가산하는 옵션입니다. 다음은 상수 합산의 예시표입니다.

참조: P1023 � 1000의 결과는 P23입니다. P0023의 결과가 필요하다면, P23 + 0000이라는 이름 변경 명령을 다시 수행하도록 합니다.

보고서

원래 이름과 새 이름에 대한 보고서를 만들려면 이 확인란을 선택합니다. [확인] 단추를 누르면 해당 보고서가 기본 HTML 뷰어에 나타납니다.


[등록 정보] 명령

등록 정보 창을 불러오려면 이 명령을 실행합니다.

[편집 / 등록 정보] 명령 항목을 선택합니다.

등록 정보 창이 나옵니다.


CAD 스타일 - 개요
    CAD 스타일 − 개요

추가 정보

기타	대화 상자
개요

CAD 스타일은 '평면도 보기' 모드의 Trimble Geomatics Office 그래픽 창에서 개체(포인트, 선, 텍스트)가 디스플레이 되는 형식을 설정합니다.

CAD 스타일의 구성 항목:

  포인트 스타일

  선 스타일

  텍스트 스타일

포인트 스타일 및 선 스타일

포인트 스타일과 선 스타일은 포인트와 선의 디스플레이 형식을 설정합니다.

포인트 스타일은 포인트 심벌과 그 설정 항목(심벌의 크기와 색상, 치수)으로 구성됩니다. 포인트 심벌을 만들고 편집하려면 Symbol Editor 유틸리티를 이용합니다.

선 스타일은 선 형식과 그 설정 항목(선 형식의 크기와 색상, 치수)으로 구성됩니다. 선 형식을 만들고 편집하려면 Line Type Editor 유틸리티를 이용합니다

포인트나 선의 스타일을 설정하는 방법은 다음 2가지입니다.

  등록 정보 창

  피쳐 코드 처리

포인트 스타일을 만들고 편집하려면 Trimble Geomatics Office의 [CAD 스타일] 대화 상자나 Feature and Attribute Editor 유틸리티를 이용합니다

Trimble 기본 템플리트에는 심벌 파일(*.sym)/선 형식 파일(*.ltp)의 각 심벌/선 형식에 대한 포인트 스타일/선 스타일이 있습니다. 이 스타일의 이름은 해당 심벌이나 선 형식의 이름과 같습니다.

어떤 포인트나 선의 스타일 필드를 <레이어 기준>으로 설정하면, 그 포인트나 선에 지정되는 스타일이 해당 레이어에 의해 결정되게 됩니다. 기본값 스타일이 그 레이어에 대하여 설정됩니다.

서로 다른 레이어에 대하여 기본값 스타일을 설정하려면 [레이어] 대화 상자를 이용합니다.

텍스트 스타일

텍스트 스타일은 Trimble Geomatics Office에서 텍스트 개체가 디스플레이 되는 형식을 설정합니다. 등록 정보 창을 이용하여 텍스트 개체에 대한 스타일을 설정합니다. 텍스트 스타일은 글꼴, 크기 정보, 글꼴 포맷으로 구성됩니다. Trimble이 제공하는 텍스트 스타일은 '표준'이라는 이름의 스타일 한 가지 밖에 없지만, 사용자가 Trimble Geomatics Office의 [CAD 스타일] 대화 상자를 이용하여 따로 만들 수도 있습니다.


    [스타일] 명령

이 명령을 이용하여 포인트 스타일이나 선 스타일, 텍스트 스타일을 만들거나 관리합니다.

[스타일] 명령은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 스타일]을 선택합니다.

  <Ctl+S>를 누릅니다.

[CAD 스타일] 대화 상자가 나옵니다.


    [CAD 스타일] 대화 상자

 개요 및 추가 정보

포인트 스타일이나 선 스타일, 텍스트 스타일을 만들거나 관리합니다.

이 대화 상자를 불러오는 방법:

  [편집 / 스타일] 명령을 실행합니다.

새로 만들기

스타일 만들기의 대화 상자를 불러와, 현재 선택한 탭의 스타일을 새로 만듭니다.

편집

기존 스타일을 편집하려면 이 단추를 누릅니다. 프로젝트의 개체에 사용 중인 CAD 스타일을 편집하는 경우, 그 개체는 새로운 CAD 스타일 설정에 의거, 업데이트됩니다.

삭제

스타일을 삭제하려면 [삭제] 단추를 누릅니다. 프로젝트의 개체에 사용 중이지 않은 CAD 스타일은 삭제할 수 있습니다.


    [포인트 스타일 만들기/편집] 대화 상자

포인트 스타일을 만들거나 편집하는 대화 상자입니다.

불러오는 방법:

1.	'평면도 보기' 모드에서 [편집 / 스타일] 명령을 실행합니다. [CAD 스타일] 대화 상자가 나옵니다.

2.	[포인트 스타일] 탭 하에서 다음 중 하나를 실행합니다.

  [새로 만들기] 단추를 누르면 [포인트 스타일 만들기] 대화 상자가 나옵니다.

  [편집] 단추를 누르면 [포인트 스타일 편집] 대화 상자가 나옵니다.

[편집] 단추는 어떤 스타일을 선택할 때, 활성화됩니다.

이름

새 포인트 스타일의 이름을 입력하거나 기존 포인트 스타일의 이름을 변경합니다. 모든 포인트 스타일의 이름은 유일한 것이어야 하지만, 포인트 스타일과 선 스타일, 텍스트 스타일에 대하여 동일한 이름을 쓰는 것은 무방합니다.

심벌

심벌 목록에서 심벌을 하나 선택합니다. 심벌을 보거나 편집하려면 Symbol Editor 유틸리티를 이용합니다.

색상

심벌의 색을 선택합니다. 창 텍스트를 선택하면 그 스타일은 Microsoft Windows의 창 텍스트 설정에 의거, 표시되게 됩니다. 창 텍스트 설정의 변경은 Microsoft Windows의 제어판을 이용합니다. 창 텍스트를 이용하는 경우, 기본값 '범례 스타일'이 선택되어 있다면 플로팅시 검정 색이 쓰입니다. 기본값 '범례 스타일'은 [보기 / 옵션] / [측량 범례] 탭에서 선택합니다. 검정 색 '범례 스타일'이 선택되어 있다면 플로팅시 흰색이 쓰입니다.

일부 심벌 정의 중에는 색이 이미 정의되어 있는 것이 있습니다. 이 색은 해당 심벌을 Trimble Symbol Editor 유틸리티에서 만들 때 설정된 것입니다. 예를 들어, 심벌 '숲'의 색을 Trimble Symbol Editor 유틸리티에서 녹색으로 설정할 수 있을 것입니다. 색상 정의가 되어 있는 이런 심벌을 선택할 경우에는 [색상] 필드를 이용할 수 없는데, '심벌로부터'라는 표시가 이 필드에 나타납니다.

지름

심벌의 지름 크기를 입력합니다. [지름] 필드의 단위는 설정된 '치수' 옵션이 '도면'인지 '지상'인지의 여하에 따라 달라집니다. 지름을 적용하기 곤란한 일부 심벌(예: 단일 픽셀 점)의 경우에는 이 필드를 이용할 수 없습니다.

도면	이 옵션의 선택시, 심벌의 지름 값은 도면에서의 심벌 크기를 결정합니다.

예를 들어, '치수' 옵션이 '도면'이고 [지름] 필드에 5를 입력하면 그 심벌은 미터 플롯상에서 5mm로 나타납니다. Trimble Geomatics Office에서 쓰는 단위는 좌표 단위입니다. 좌표 단위를 설정하려면, [파일 / 프로젝트 등록 정보]의 [단위와 포맷] 탭을 선택합니다.

화면상의 도면 단위는 플롯 축척으로써 계산되어 표시됩니다. 플롯 축척은 [파일 / 시트 설정]의 [시트 설정] 대화 상자에서 설정합니다.

지상	이 옵션의 선택시, 심벌의 지름 값은 지상에서의 크기입니다.

예를 들어, '치수' 옵션이 '지상'이고 [지름] 필드에 5를 입력하면 그 심벌은 5m(또는 좌표 단위의 설정 여하에 따라 5 피트)로 나타납니다. 이것은 플롯과 화면상에서 똑같이 적용됩니다.
좌표 단위를 설정하려면, [파일 / 프로젝트 등록 정보] 명령을 실행하여 [단위와 포맷] 탭을 선택합니다.

회전 각도

[회전 각도] 필드는 심벌의 배향을 결정합니다. 이 필드의 의미는 '치수' 옵션의 설정 여하에 따라 달라집니다.

도면	이 옵션의 선택시, 심벌은 플롯 페이지의 위쪽 방향을 기준으로 플롯이 됩니다.

지상	이 옵션의 선택시, 심벌은 북쪽 방향을 기준으로 플롯이 됩니다.

치수

위에서 설명한 바와 같이, '도면' 옵션이나 '지상' 옵션의 선택 여하에 따라 [지름] 필드와 [회전 각도] 필드의 의미가 달라집니다.


    [선 스타일 만들기/편집] 대화 상자

선 스타일을 만들거나 편집하는 대화 상자입니다.

불러오는 방법:

1.	'평면도 보기' 모드에서 [편집 / 스타일] 명령을 실행합니다. [CAD 스타일] 대화 상자가 나옵니다.

2.	[선 스타일] 탭 하에서 다음 중 하나를 실행합니다.

  [새로 만들기] 단추를 누르면 [선 스타일 만들기] 대화 상자가 나옵니다.

  [편집] 단추를 누르면 [선 스타일 편집] 대화 상자가 나옵니다.

[편집] 단추는 어떤 스타일을 선택할 때, 활성화됩니다.

이름

새 선 스타일의 이름을 입력하거나 기존 선 스타일의 이름을 변경합니다. 모든 선 스타일의 이름은 유일한 것이어야 하지만, 선 스타일과 포인트 스타일, 텍스트 스타일에 대하여 동일한 이름을 쓰는 것은 무방합니다.

설정

[설정] 상자를 이용하여 스타일의 모양을 정의합니다.

선 형식

해당 선에 대한 선 형식을 선택합니다. 선 형식을 보거나 편집하려면 Trimble Line Type Editor유틸리티 를 이용합니다.

색상

선 스타일에 대한 색을 선택합니다. 창 텍스트를 선택하면 그 스타일은 Microsoft Windows의 창 텍스트 설정에 의거, 표시되게 됩니다. Windows 설정의 변경은 Microsoft Windows의 제어판을 이용합니다. 창 텍스트를 이용하는 경우, 기본값 '범례 스타일'이 선택되어 있다면 플로팅시 검정 색이 쓰입니다. 기본값 '범례 스타일'은 [보기 / 옵션] / [측량 범례] 탭 에서 선택합니다.  검정 색 '범례 스타일'이 선택되어 있다면 플로팅시 흰색이 쓰입니다.

일부 선 형식 정의 중에는 색이 이미 정의되어 있는 것이 있습니다. 이 색은 해당 선 형식을 Trimble Line Type Editor 유틸리티에서 만들 때 설정된 것입니다. 예를 들어, 선 형식 '산울타리'의 색을 Trimble Line Type Editor 유틸리티에서 녹색으로 설정할 수 있을 것입니다. 색상 정의가 되어 있는 이런 선 형식을 선택할 경우에는 [색상] 필드를 이용할 수 없는데, '선 형식으로부터'라는 표시가 이 필드에 나타납니다.

길이

반복되는 패턴의 길이를 입력합니다. 이 필드는 어떤 선에 대한 선 스타일을 선택할 때, 그 선 형식이 반복 패턴일 경우, 이용합니다. 예를 들어, '울타리 선'을 그 반복 형식으로 선택할 수 있는데, 다음은 이에 대한 예시표입니다.

일부 선 형식 중에는 길이가 내재된 것(예: 출입구)이 있는데, 이 경우에는 [길이] 필드를 이용할 수 없습니다.

이 필드의 의미는 '치수' 옵션이 어떻게 설정되어 있느냐에 따라 달라집니다. 즉 설정된 '치수' 옵션이 '도면'인지 '지상'인지의 여하에 따라 [길이] 필드의 단위가 달라집니다.

도면	이 옵션의 선택시, 길이 값은 mm나 인치로 설정됩니다. 단위는 [파일 / 프로젝트 등록 정보]의 [단위와 포맷] 탭에서 설정된 좌표 단위 여하에 따라 달라집니다 .

예를 들어, '치수' 옵션이 '도면'이고 [길이] 필드에 5를 입력하면 그 선의 플롯은 5mm나 5 인치의 패턴 반복으로 이루어집니다.

화면상의 도면 단위는 플롯 축척으로써 계산되어 표시됩니다. 플롯 축척은 [파일 / 시트 설정] 명령을 실행하여 설정합니다.

지상	이 옵션의 선택시, 길이 값은 좌표 단위에 대하여 설정된 지상 값입니다. 이 단위를 설정하려면, [파일 / 프로젝트 등록 정보] 명령을 실행하여 [단위와 포맷] 탭을 선택합니다.

예를 들어, '치수' 옵션이 '지상'이고 [길이] 필드에 5를 입력하면 그 선은 5m나 5 피트의 패턴 반복으로 나타납니다. 이것은 플롯과 화면상에서 똑같이 적용됩니다.

너비

선의 너비를 입력합니다. 너비를 적용하기 곤란한 일부 선 형식(예: 실선)의 경우에는 이 필드를 이용할 수 없습니다. 다음은 선의 너비에 대한 예시표입니다.

이 필드의 의미는 '치수' 옵션이 어떻게 설정되어 있느냐에 따라 달라집니다.

도면	이 옵션의 선택시, 선 형식은 mm나 인치로 설정됩니다. 단위는 좌표 단위의 설정 여하에 따라 달라지는데, 이 설정 작업은 [파일 / 프로젝트 등록 정보]의 [단위와 포맷] 탭을 선택하여 실행합니다.

지상	이 옵션의 선택시, 선 형식 값은 [파일 / 프로젝트 등록 정보] / [단위와 포맷] 탭 하의 좌표 단위에 대하여 설정된 지상 값입니다.

치수

위에서 설명한 바와 같이, '도면' 옵션이나 '지상' 옵션의 선택 여하에 따라 [길이] 필드와 [너비] 필드의 의미가 달라집니다.


    [텍스트 스타일 만들기/편집] 대화 상자

텍스트 스타일을 만들거나 편집하는 대화 상자입니다.

불러오는 방법:

1.	'평면도 보기' 모드에서 [편집 / 스타일] 명령을 실행합니다. [CAD 스타일] 대화 상자가 나옵니다.

2.	[텍스트 스타일] 탭을 선택합니다.

3.	다음 중 하나를 실행합니다.

  [새로 만들기] 단추를 누르면 [텍스트 스타일 만들기] 대화 상자가 나옵니다.

  [편집] 단추를 누르면 [텍스트 스타일 편집] 대화 상자가 나옵니다.

[편집] 단추는 어떤 스타일을 선택할 때, 활성화됩니다.

이름

새 텍스트 스타일의 이름을 입력하거나 기존 텍스트 스타일의 이름을 변경합니다. 모든 텍스트 스타일의 이름은 유일한 것이어야 하지만, 텍스트 스타일과 선 스타일, 포인트 스타일에 대하여 동일한 이름을 쓰는 것은 무방합니다.

글꼴

텍스트 스타일에 대한 글꼴을 선택합니다.

목록에 나열되는 글꼴 이름들은 사용자의 Microsoft Windows 시스템에 설치되어 있는 것입니다.

색상

텍스트에 대한 색을 선택합니다. 색상을 선택하지 않을 경우에 적용되는 기본값은 Microsoft Windows의 창 텍스트 설정입니다. 창 텍스트 설정의 변경은 Microsoft Windows의 제어판을 이용합니다. 창 텍스트를 이용하는 경우, 기본값 '범례 스타일'이 선택되어 있다면 플로팅시 검정 색이 쓰입니다. 기본값 '범례 스타일'은 [보기 / 옵션] / [측량 범례] 탭 에서 선택합니다. 검정 색 '범례 스타일'이 선택되어 있다면 플로팅시 흰색이 쓰입니다.

높이

텍스트 스타일의 높이를 입력합니다.

이 필드의 의미는 '치수' 옵션이 어떻게 설정되어 있느냐에 따라 달라집니다.

도면	이 옵션의 선택시, 높이 값은 mm나 인치로 설정됩니다. 단위는 [파일 / 프로젝트 등록 정보]의 [단위와 포맷] 탭에서 설정된 좌표 단위 여하에 따라 달라집니다.

예를 들어, '치수' 옵션이 '도면'이고 [높이] 필드에 5를 입력하면 그 텍스트의 높이는 미터 플롯에서 5mm로 나타납니다. 화면상의 도면 단위는 [파일 / 시트 설정]에서 명시된 플롯 축척으로써 계산되어 표시됩니다.

지상	이 옵션의 선택시, 높이 값은 [파일 / 프로젝트 등록 정보] 명령의 [단위와 포맷] 탭에서 좌표 단위에 대하여 설정한 지상 값입니다.

예를 들어, '치수' 옵션이 '지상'이고 [높이] 필드에 5를 입력하면 그 텍스트의 높이는 미터 플롯에서 5m로 나타납니다. 이것은 플롯과 화면상에서 똑같이 적용됩니다.

글꼴 유형

[굵게]나 [이탤릭], [밑줄] 등의 확인란을 선택함으로써, 필요한 텍스트 효과를 냅니다.

치수

위에서 설명한 바와 같이, '도면' 옵션이나 '지상' 옵션의 선택 여하에 따라 [높이] 필드의 의미가 달라집니다.


    [레이어] 명령

현재 작업 중인 프로젝트의 레이어를 관리하는 명령입니다.

실행 방법:

  [편집 / 레이어]를 선택합니다.

[레이어] 대화 상자가 나옵니다.


    [레이어] 대화 상자

 개요 및 추가 정보

현재 작업 중인 프로젝트의 레이어를 관리하는 대화 상자입니다.

이 대화 상자를 불러오는 방법은 다음 세 가지입니다.

  [편집 / 레이어] 명령을 실행합니다.

  [레이어 편집] 도구 단추 [image] 를 누릅니다.

  <Ctrl+L>을 누릅니다.

이 대화 상자의 제일 위에는 현재 레이어가 나옵니다.

이름

레이어의 이름을 입력합니다. 그 이름은 유일한 것이어야 합니다. 개체가 들어 있는 레이어의 이름을 바꾸면 그 개체가 새 레이어로 이동하게 됩니다.

포인트 스타일

목록에서 포인트 스타일을 하나 선택합니다. 목록에는 Trimble 스타일은 물론, 사용자가 Trimble Geomatics Office에서나([편집 / 스타일] 명령을 이용하여) 피쳐 코드 처리 과정에서(자세한 사항은 Feature and Attribute Editor 유틸리티 도움말 참조) 새로 만든 포인트 스타일이 나옵니다.

선택한 포인트 스타일은 이 레이어의 모든 포인트(지정 포인트 스타일이 <레이어 기준>인)에 적용됩니다.

선 스타일

목록에서 선 스타일을 하나 선택합니다. 목록에는 Trimble 스타일은 물론, 사용자가 Trimble Geomatics Office에서나([편집 / 스타일] 명령을 이용하여) 피쳐 코드 처리 과정에서(자세한 사항은 Feature and Attribute Editor 유틸리티 도움말 참조) 새로 만든 선 스타일이 나옵니다.

선택한 선 스타일은 이 레이어의 모든 선(지정 선 스타일이 <레이어 기준>인)에 적용됩니다.

텍스트 스타일

목록에서 텍스트 스타일을 하나 선택합니다. 목록에는 Trimble 스타일은 물론, 사용자가 Trimble Geomatics Office에서 [편집 / 스타일] 명령으로써 새로 만든 텍스트 스타일이 나옵니다.

선택한 텍스트 스타일은 이 레이어의 모든 텍스트와 주석(지정 텍스트 스타일이 <레이어 기준>인)에 적용됩니다.

보호

이 확인란을 선택 해제하면, Trimble Geomatics Office 그래픽 창에서 그 레이어의 개체를 선택할 수 있게 됩니다. 이 확인란을 선택하면 그 레이어의 개체를 선택할 수 없습니다. 이 필드의 값은 레이어 도구 모음의 [레이어 선택] 도구 단추에서 표시됩니다.

레이어가 보호 상태(locked)일 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

레이어가 보호 상태가 아닐 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

[보호] 필드가 선택 상태인 레이어가 하나 이상 있을 경우, [image] 아이콘이 상태 표시줄에 나타납니다.

참조: 이 확인란을 선택하면, 다음의 어떤 방법으로도 그 레이어에 있는 개체를 볼 수 없습니다.

  등록 정보 창을 이용하는 방법

  마우스로 개체를 클릭하여 선택하는 방법

  [선택] 메뉴의 명령 항목을 이용하는 방법

표시

이 확인란을 선택하면 그래픽 창에서 그 레이어의 개체를 볼 수 있습니다. 이 필드의 값은 레이어 도구 모음의 [레이어 선택] 도구 단추에서 표시됩니다.

레이어가 표시 상태일 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

레이어가 표시 상태가 아닐 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

레이어의 개체를 숨기려면 이 확인란을 선택 해제합니다.

참조: 이 확인란을 선택 해제하면, 그 레이어의 개체를 Trimble Geomatics Office 그래픽 창에서 볼 수 없습니다.

하나 이상의 레이어가 숨겨져 있으면, '숨겨진 레이어' 아이콘 [image] 이 상태 표시줄에 나타납니다. 즉, 이 아이콘은 '표시' 속성이 선택 해제되어 있는 레이어가 하나 이상일 때 상태 표시줄에 나타납니다.

주의: 레이어가 숨겨진 상태일 경우, 그 레이어의 개체를 보거나 선택할 수 없습니다. 이것은 그 레이어가 보호 상태이든, 그렇지 않든 상관없이 적용됩니다. 즉, '표시' 옵션이 '보호' 옵션에 우선합니다.

새로 만들기

이 단추를 눌러 프로젝트에 새 레이어를 추가합니다. [레이어] 대화 상자에 새 행이 추가됩니다. 새 레이어의 각 열에 값을 입력합니다.

삭제

현재 선택된 레이어를 삭제하려면 [삭제] 단추를 누릅니다. 개체가 들어 있는 레이어를 삭제할 경우에는 경고 대화 상자가 나와, 포함된 개체도 함께 삭제된다는 경고 메시지를 표시합니다.

현재

이 단추를 누르면 선택한 레이어를 현재 레이어(Current layer)로 할 수 있습니다. 현재 레이어는 새로운 개체가 추가되는 레이어인데, 하이라이트 표시가 됩니다. 레이어 이름이 없이 데이터베이스에 추가되는 개체(포인트, 선, 호, 곡선, 텍스트, 주석)는 모두 현재 레이어에 추가되게 됩니다.

팁: [레이어] 대화 상자에서 복수의 입력 항목을 편집할 수 있습니다.

1.	Ctrl 키를 이용하여 입력 항목을 여러 개 선택합니다.

2.	선택한 마지막 필드를 편집하면 나머지 입력 항목이 모두 업데이트됩니다.


레이어 - 개요
    레이어 − 개요

추가 정보

방법...	대화 상자	기타
개요

'평면도 보기' 모드에서, 프로젝트의 각 개체는 어떤 레이어에 속하게 됩니다. 레이어는 이름, 포인트 스타일, 선 스타일, 텍스트 스타일 등으로 구성되는데, 다량의 데이터 집합을 관리할 때 유용하게 쓰이는 도구입니다. 즉 데이터를 레이어 형태로 조직화하면 그 관리가 훨씬 쉬워집니다. 예를 들어, 피쳐 코드가 'tree'인 포인트는 모두 'Trees'라는 이름의 레이어로 그룹화할 수 있습니다. 프로젝트에서 새 레이어를 만들지 않았다면, 기본값 레이어가 모든 개체에 적용됩니다.

모든 개체(포인트, 선, 호, 곡선, 텍스트, 주석)는 [레이어] 필드가 있습니다. 등록 정보 창을 이용하면 개체를 볼 수 있습니다. 어떤 개체에 대한 레이어의 선택은 다음 중 하나의 방법으로 합니다.

  프로젝트에 개체를 추가할 때, 해당 대화 상자의 [레이어] 필드로부터 레이어를 선택합니다.

  명시된 레이어가 있는 파일을 가져옵니다.

  피쳐 코드 처리를 이용합니다.

  프로젝트의 기존 개체에 대한 레이어를 선택하려면 등록 정보 창을 이용합니다.

프로젝트에 대한 여러 레이어의 관리는 [레이어] 대화 상자를 이용합니다.

보고 선택할 수 있는 레이어가 어떤 것이 있는지 명확히 하려면 [레이어 선택] 도구 단추를 이용합니다. 특정 레이어에 있는 개체를 선택하고자 하면,

  [선택 / 레이어 기준] 명령을 실행합니다.

데이터베이스에 있는 어떤 포인트의 [포인트 스타일] 필드가 <레이어 기준>으로 설정되어 있을 경우, 그 포인트에는 해당 레이어의 지정 포인트 스타일이 할당되게 됩니다. 또한, 선이나 곡선, 호의 [선 스타일] 필드가 <레이어 기준>으로 설정되어 있을 경우, 그 선이나 곡선, 호에는 해당 레이어의 지정 선 스타일이 할당됩니다. 마찬가지로, 텍스트나 주석의 [텍스트 스타일] 필드가 <레이어 기준>으로 설정되어 있을 경우, 그 텍스트나 주석에는 해당 레이어의 지정 텍스트 스타일이 할당됩니다.


중복 포인트 - 개요
중복 포인트 − 개요

추가 정보

방법 ...	대화 상자
개요

이름이 같은 포인트를 가져올 경우 택할 수 있는 처리 옵션은 2 가지입니다.

1.	항상 중복 포인트 병합

2.	허용 편차 이내의 중복 포인트 병합. 수평/수직 허용 편차가 어느 정도 이내이면 포인트를 병합할지 정할 수도 있고, 아니면 가져오기시 중복 포인트를 전혀 해소하지 않도록 설정할 수도 있습니다.

가져오기시 Trimble Geomatics Office는 이름이 같은 포인트를 병합하므로(기본값임), 중복 포인트가 생기지 않습니다. (데이터 가져오기를 가장 빨리 수행하는 방법임)

하나 이상의 파일에 있는 여러 관측치나 좌표가 1)동일한 포인트에 대한 것이고, 2)사용자가 설정한 허용 편차를 초과할 경우, 그 파일(들)을 가져올 때 중복 포인트를 병합하지 않기로 결정한다면, 중복 포인트가 생깁니다. 그 외, 중복 포인트가 발생할 수 있는 예:

  어떤 파일을 가져올 때, 그 파일에 있는 포인트가 데이터베이스의 기존 포인트와 이름이 같지만 허용 편차를 초과할 경우

  서로 다른 Survey Controller (*.dc) 파일로부터 이름이 같은 포인트들을 가져올 경우

필요하다면 이 소프트웨어 내에서 [중복 포인트 병합] 명령을 실행함으로써 포인트 병합을 할 수도 있습니다.

Trimble Geomatics Office에서의 포인트 병합 방식

각 포인트에는 사용자 입력 WGS-84 좌표와 사용자 입력 그리드/로컬 좌표가 각각 단 하나만 있을 수 있습니다. Trimble Geomatics Office는 다음과 같은 규칙을 바탕으로 하여 기존의 어느 WGS-84 좌표나 그리드/로컬 좌표를 덮어쓸지 결정합니다.

1.	질 등급이 가장 높은 좌표를 택합니다.

2.	마지막으로 데이터베이스에 입력한 좌표 구성 요소를 이용합니다.

포인트 도출 보고서에는 포인트의 좌표 설정에 이용한 측량 데이터가 자세히 표시되고, 가져오기 보고서에는 덮어 쓰여졌거나 폐기된 좌표 구성 요소가 모두 나열됩니다.

참조: 사용하고자 하는 좌표를 소프트웨어가 덮어써 버리는 경우에는 반드시 그 가져오기 작업을 실행 취소하고, 해당 도입 파일을 편집(또는 Trimble Geomatics Office 프로젝트의 포인트 이름을 변경)한 다음, 그 데이터를 다시 가져와야 합니다. 또는, 그 가져오기 작업을 실행 취소하고, [중복 포인트 옵션] 대화 상자의 [허용 편차 이내의 중복 포인트 병합] 옵션을 이용하여 그 데이터를 재차 가져온 다음, Trimble Geomatics Office 상에서 중복 포인트 이름 변경을 하는 방식으로 처리할 수도 있습니다.


[중복 포인트 옵션] 대화 상자

추가 정보

방법 ...	기타

이 대화 상자를 이용하여 가져오기시 이름이 같은 포인트를 처리하는 방식을 설정합니다.

이 대화 상자의 설정 내용은 모든 가져오기 옵션에 적용됩니다. 즉, 프로젝트 표시줄을 이용하여 파일을 가져오거나, 아니면 마우스로써 파일을 Trimble Geomatics Office 프로젝트에 끌어다 놓는 방식을 쓰거나 상관없이 소프트웨어는 현행 중복 포인트 옵션의 설정 내용을 그대로 적용합니다. 중복 포인트 옵션을 설정하기 위한 템플리트를 만들 수도 있습니다.

[중복 포인트 옵션] 대화 상자를 불러오는 방법:

1.	[파일 / 가져오기] 명령을 실행하면 [가져오기] 대화 상자가 나옵니다.

2.	[옵션]을 누릅니다.

처리 옵션:

항상 중복 포인트 병합

이 옵션이 기본값으로 설정됩니다. 가져오기시 이름이 같은 포인트는 자동으로 병합되므로 중복 포인트는 발생하지 않습니다.  가져오기 작업 후, 덮어 쓰여지거나 폐기된 좌표 구성 요소는 가져오기 보고서에 모두 나열됩니다.

참조: 사용하고자 하는 좌표를 소프트웨어가 덮어써 버리는 경우에는 반드시 그 가져오기 작업을 실행 취소하고, 해당 도입 파일을 편집(또는 Trimble Geomatics Office 프로젝트의 포인트 이름을 변경)한 다음, 그 데이터를 다시 가져와야 합니다. 또는, 그 가져오기 작업을 실행 취소하고, [중복 포인트 옵션] 대화 상자의 [허용 편차 이내의 중복 포인트 병합] 옵션을 이용하여 그 데이터를 재차 가져온 다음, Trimble Geomatics Office 상에서 중복 포인트 이름 변경을 하는 방식으로 처리할 수도 있습니다

허용 편차 이내의 중복 포인트 병합

이 옵션을 선택하는 경우, 어떤 포인트에 대한 측량 데이터는 사용자가 지정한 수평 허용 편차나 수직 허용 편차(또는 둘 다)의 충족시 그 포인트 하에 모두 위치하게 됩니다. 기본값 허용 편차는 [프로젝트 등록 정보] 대화 상자의 [재계산] 탭에서 명시된 미지의 수평/수직 허용 편차로부터 결정됩니다. 가져오기 작업 후, 덮어 쓰여지거나 폐기된 좌표는 가져오기 보고서에 모두 나열됩니다.

또한 이 옵션을 이용함으로써 가져오기시 중복 포인트를 병합하지 않도록 설정할 수도 있습니다. 데이터 가져오기에 대한 수평 허용 편차는 0.02(즉, 수평 측량 등급 허용 편차), 수직 허용 편차는 0.050(즉, 수직 측량 등급 허용 편차)로 각각 설정하면 됩니다. 그 다음, Trimble Geomatics Office 상에서 중복 포인트 이름 변경을 하는 방식으로 처리할 수 있습니다. 수평 허용 편차와 수직 허용 편차를 둘 다 지정하면 양자가 공히 충족될 경우에만 중복 포인트가 병합됩니다. 허용 편차를 지정하지 않으면(즉, [허용 편차] 상자에서 [수평] 확인란과 [수직] 확인란을 선택하지 않으면), 중복 포인트는 병합되게 됩니다.

참조: 디지털 레벨 데이터의 가져오기시에는 수직 허용 편차만 이용됩니다.

참조: 허용 편차를 0.000으로 설정하면 중복 포인트는 그 좌표가 조금도 다르지 않아야만 병합이 됩니다.


[포인트 분해] 명령

데이터를 다음 기준으로 분리함으로써 한 포인트에서 여러 포인트를 만드는 명령입니다.

  데이터 출처

  모든 관측치

  데이터 형 (GPS/비GPS)

[편집 / 포인트 분해] 명령을 실행합니다.

[포인트 분해] 대화 상자가 나옵니다.

포인트 분해 목적:

  중복 포인트 해소

  모든 관측치에 대한 위치 계산

  GPS 데이터와 그리드/로컬 데이터가 동일 포인트 하에 있을 경우, Trimble Geomatics Office에서 캘리브레이션 수행

  GPS 관측치와 비GPS 관측치 분리


[포인트 분해] 대화 상자

포인트의 측량 데이터는 그 출처가 2개 이상일 수 있습니다. 또 포인트의 위치 계산에 쓰이는 관측치는 단 하나밖에 없다 하더라도 해당 데이터 출처는 2개 이상의 관측치를 포함할 수 있습니다.

포인트 분해에 이용하는 데이터 분리 기준은 데이터 출처, 모든 관측치, 데이터 형(GPS/비GPS)입니다. 포인트 분해 목적:

  중복 포인트 해소

  모든 관측치에 대한 위치 계산

  GPS 데이터와 그리드/로컬 데이터가 동일 포인트 하에 있을 경우, Trimble Geomatics Office 소프트웨어에서 GPS 사이트 캘리브레이션 수행

  GPS 관측치와 비GPS 관측치 분리

포인트 분해 작업시 이름이 같은 포인트들이 만들어집니다.

예를 들어, Survey Controller (*.dc) 파일 2개를 같은 프로젝트에 가져오는 경우,

  첫째 DC 파일에는 포인트 '101'에 대한 광파 관측치가 있고

  둘째 DC 파일에는 동일한 포인트 '101'에 대한 키입력된 좌표와 GPS 관측치가 있다면

첫째 파일을 가져올 때, 프로젝트에 포인트 '101'이 만들어지고 그 관측치가 포인트의 위치 도출에 이용됩니다. 둘째 파일을 가져올 때, Trimble Geomatics Office는 이 DC 파일의 키입력된 좌표를 프로젝트의 포인트 위치와 비교합니다. 이 DC 파일의 측량 데이터가 동일한 포인트 '101'에 대한 것이므로 프로젝트의 포인트와 DC 파일의 포인트는 하나로 자동 병합되게 됩니다. 측량 데이터의 출처는 2개(두 DC 파일)이고, 이 포인트에 대한 좌표 출처는 다음 3개입니다.

  광파 관측치

  키입력된 좌표

  GPS 선점

팁: 등록 정보 창 페이지 메뉴로부터 데이터 출처, 포인트의 관측치 및 좌표 내용을 볼 수 있습니다.

포인트 분해는 현재의 선택 집합에 어떤 포인트가 있고, 이 포인트에 관측치나 좌표가 여러 개 있을 경우에만 할 수 있습니다.

[포인트 분해] 대화 상자는 [편집 / 포인트 분해] 명령을 실행하여 불러옵니다.

분해

포인트를 별개의 여러 포인트로 분해함에 있어 소프트웨어 상에서 적용되는 방식은 다음과 같습니다.

데이터 출처 기준	예를 들어, .dc 파일
모든 관측치 기준	어떤 포인트의 모든 관측치와 좌표로부터 별개의 포인트가 생성됩니다.
데이터 형 기준	모든 GPS 관측치와 WGS-84 좌표가 한 포인트 하에, 모든 그리드 좌표와 비GPS 관측치가 또 다른 포인트 하에 놓여집니다.
참조: Trimble Geomatics Office에서 GPS 사이트 캘리브레이션을 수행할 필요가 있을 때, 만일 GPS 관측치와 그리드 좌표가 동일 포인트 하에 있다면 데이터 형 기준의 포인트 분해를 하도록 합니다. 이 경우, 2 개의 포인트(그리드 점과 GPS 점)가 생기게 되므로 이를 이용하여 GPS 사이트 캘리브레이션을 수행할 수 있습니다.

접미어로써 GPS 점의 이름 변경 (_GPS)

데이터 형 기준을 선택할 경우, [접미어로써 GPS 점의 이름 변경] 옵션이 활성화됩니다. 이것은 GPS 점에 접미어를 첨가함으로써 그 포인트 이름들을 각자 유일하게 만드는 역할을 합니다. 만약 이 옵션을 선택하지 않으면, 포인트들은 데이터 형 기준으로 분해되고 각 포인트의 이름이 모두 같아집니다.

분해 통계 표시

이 확인란을 선택하면 지정한 분해 방식 하에서 해당 포인트로부터 만들 수 있는 포인트의 수가 표시됩니다.


[다중 편집] 명령

 기타

선택 부분에 있는 여러 개체의 측량 관련 등록 정보나 CAD 관련 등록 정보를 한번에 편집하는 명령 항목입니다. 이 명령은 현재의 선택 집합이 있을 경우에만 이용할 수 있습니다.

[다중 편집] 명령은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 다중 편집]을 선택합니다.

  바로 가기 메뉴에서 [다중 편집]을 선택합니다.

[다중 편집] 대화 상자([측량] 탭 또는 [CAD] 탭)가 나옵니다.


[다중 편집] 대화 상자 - [측량] 탭
[다중 편집] 대화 상자 − [측량] 탭

여러 개체의 측량 관련 등록 정보를 한번에 편집하는 대화 상자입니다. 예를 들어, 여러 GPS 점의 선점에 대한 안테나 높이가 잘못 입력되었으면 이를 정정할 수 있습니다.

이 대화 상자는 다음 중 하나의 방법으로 불러옵니다.

  [편집 / 다중 편집] 명령을 실행합니다.

  바로 가기 메뉴에서 [다중 편집]을 선택합니다.

참조: 다중 편집의 대상이 될 선택 부분은 타당성 확인 과정을 거치게 되는데, 만일 올바른 것이 아니라고 판정이 되면 이용하지 못할 수 있습니다.

선택된 포인트에 다음의 편집 작업 수행

이 상자에는 선택된 포인트에 대하여 사용자가 수정할 수 있는 측량 관련 등록 정보가 나옵니다.

안테나 높이 새로 설정

이 확인란을 선택하면 다음 필드가 활성화됩니다. 이 두 필드를 이용하여 포인트 선점 작업의 안테나 높이를 변경합니다.

수정할 높이의 크기	변경하고자 하는 포인트의 안테나 높이 값을 선택합니다. 목록에는 선택된 포인트들에 입력한 높이가 나오는데, 여기에서 선택한 값의 안테나 높이만이 변경됩니다.
수정 후 안테나 높이	적용하고자 하는 올바른 안테나 높이 값을 입력합니다.

GPS 안테나 내역 새로 설정

이 확인란을 선택하면 다음 필드가 활성화됩니다. 이 두 필드를 이용하여 안테나 종류나 높이 측정 방법을 변경합니다.

안테나 종류	변경하고자 하는 포인트에 대한 안테나 종류를 선택합니다.
높이 지점	변경하고자 하는 포인트에 대한 측정 방법을 선택합니다 . 이 필드에 나타나는 목록은 선택한 안테나 종류 여하에 따라 달라집니다. 새로운 안테나 종류를 선택하면 이 필드에는 아무 것도 나오지 않습니다.

광파 타겟 내역 새로 설정

이 확인란을 선택하면 다음 필드가 활성화됩니다. 이 두 필드를 이용하여 타겟 높이와 프리즘 상수를 변경합니다.

타겟 높이	적용하고자 하는 올바른 타겟 높이를 입력합니다.
프리즘 상수	적용하고자 하는 올바른 프리즘 상수를 입력합니다.

레이저 타겟 높이 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 적용하고자 하는 올바른 타겟 높이를 입력합니다.

선택된 관측치에 다음의 편집 작업 수행

이 상자에는 선택된 관측치(GPS, 광파, 레이저)에 대하여 사용자가 수정할 수 있는 측량 관련 등록 정보가 나옵니다.

망 조정에 이용

이 확인란을 선택하면 필드가 활성화됩니다. 이 필드를 이용하여 망 조정에 특정 관측치를 이용하거나 배제합니다. (Network Adjustment 모듈이 설치되어 있는 경우)

이 설정은 공분산 (QC2) 정보가 있는 GPS 관측치에만 적용됩니다. 이것이 아니오로 설정되어 있는 경우, 관측치는 망 조정에 이용되지 않게 됩니다. 하지만 포인트의 위치를 결정하는 재계산 과정에는 여전히 이용됩니다.

관측치 상태 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 이 필드를 이용하여 재계산에서 관측치를 이용/불이용 하거나, 관측치를 점검점으로 이용합니다.

관측치를 불이용 처리하면 이것은 재계산에 쓰이지 않게 되고, 이 관측치에 대한 폐합 오차가 있을 경우, 모두 보고됩니다. 관측치를 '점검점으로 이용'으로 설정하는 경우, 마땅한 다른 관측치나 좌표가 없는 상태에서는 포인트의 좌표 결정에 이 관측치가 이용되게 됩니다.

억제할 플래그

이 확인란을 선택하면 필드가 활성화됩니다. '측량 보기' 모드에서 억제하고자 하는 경고 플래그 종류를 이 필드에서 선택합니다. 경고 플래그는 재계산을 수행하면 다시 나타납니다.

참조: 특정 필드를 수정하기 위하여 그 확인란을 선택하는 경우, Trimble Geomatics Office는 선택된 개체에 대하여 이를 확인하는 과정을 밟습니다. 만일 선택된 개체에서 이 필드가 쓰이지 않는다면 이 확인란 옵션은 해제되게 됩니다.


[다중 편집] 대화 상자 - [CAD] 탭
[다중 편집] 대화 상자 − [CAD] 탭

선택 부분에 있는 여러 개체의 CAD 관련 등록 정보를 한번에 편집하는 대화 상자입니다.

이 대화 상자는 다음 중 하나의 방법으로 불러옵니다.

  [편집 / 다중 편집] 명령을 실행합니다.

  바로 가기 메뉴에서 [다중 편집]을 선택합니다.

선택된 포인트에 다음의 편집 작업 수행

이 상자에는 선택된 포인트에 대하여 사용자가 수정할 수 있는 CAD 관련 등록 정보가 나옵니다.

피쳐 코드 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 포인트에 적용하고자 하는 피쳐 코드 값을 입력합니다.

레이어 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 포인트에 지정하고자 하는 레이어를 선택합니다. 없는 레이어를 입력하면 [새 레이어] 대화 상자가 나옵니다.

포인트 스타일 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 포인트에 지정하고자 하는 포인트 스타일을 선택합니다. 없는 포인트 스타일을 입력하면 [포인트 스타일 만들기] 대화 상자가 나옵니다.

모든 주석 제거

선택된 포인트에 지정된 주석을 모두 제거하려면 이 확인란을 선택합니다.

선택된 선 작업에 다음의 편집 작업 수행

이 상자에는 선택된 선 작업(선, 곡선, 호)에 대하여 사용자가 수정할 수 있는 CAD 관련 등록 정보가 나옵니다.

레이어 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 선 작업에 지정하고자 하는 레이어를 선택합니다. 없는 레이어를 입력하면 [새 레이어] 대화 상자가 나옵니다.

선 스타일 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 선 작업에 적용하고자 하는 선 스타일을 선택합니다. 없는 선 스타일을 입력하면 [선 스타일 만들기] 대화 상자가 나옵니다.

모든 주석 제거

선택된 선 작업에 지정된 주석을 모두 제거하려면 이 확인란을 선택합니다.

선택된 텍스트에 다음의 편집 작업 수행

이 상자에는 선택된 텍스트에 대하여 사용자가 변경할 수 있는 필드가 있습니다.

레이어 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 텍스트에 지정하고자 하는 레이어를 선택합니다. 없는 레이어를 입력하면 [새 레이어] 대화 상자가 나옵니다.

텍스트 스타일 새로 설정

이 확인란을 선택하면 필드가 활성화됩니다. 선택된 텍스트에 적용하고자 하는 텍스트 스타일을 선택합니다. 없는 텍스트 스타일을 입력하면 [텍스트 스타일 만들기] 대화 상자가 나옵니다.


    [관측치 이용/불이용] 명령

관측치를 이용 또는 불이용 상태로 설정하는 명령입니다. 불이용 상태로 설정된 관측치는 측량 계산 작업에 전혀 이용되지 않게 됩니다.

이 명령은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 관측치 이용/불이용]을 선택합니다.

  등록 정보 창에서 관측치의 [상태] 필드를 이용합니다.

  [다중 편집] 대화 상자 / [측량] 탭에서 [관측치 상태 새로 설정] 필드를 이용합니다.

참조: 관측치는 그 상태 여하에 따라, 포인트의 계산 위치를 결정하는 재계산에 이용되기도 하고 이용되지 않기도 합니다. '관측치 이용/불이용' 기능을 이용하여 어떤 관측치를 '불이용'으로 설정하면 그것을 재계산에서 제외시킬 수 있습니다.

관측치의 상태 변경은 다음 상황에서만 가능합니다.

  현재의 선택 집합이 있고

  그 선택 집합에 있는 모든 관측치의 상태가 동일할 경우

참조: 현재의 선택 집합에 관측치가 2개 이상 있을 경우에는 다중 관측치 상태를 설정할 수 있습니다.

어떤 관측치를 '불이용'으로 설정하면 그 관측선의 색깔이 암적색으로 변합니다.

참조: 동일한 관측선을 따라 관측치가 여러 개 있을 경우, 이 모두가 '불이용' 상태로 설정된 때에만 적색으로 표시됩니다.


    [관측 방향 반전] 명령

벡터는 관측이 이루어지는 방향으로 적용됩니다. 이 명령을 실행하면 관측의 방향이 반전되어 역방향으로 적용되게 됩니다.

명령 실행 방법:

  [편집 / 관측 방향 반전]을 선택합니다.

관측 방향 반전시 포인트의 계산 좌표와 질 등급이 바뀔 수 있습니다. 관측을 적용하고 포인트의 새 위치를 계산하기 위해서는 반드시 재계산 과정을 밟아야 합니다.

주의: 관측의 기점으로 할 포인트에 어떤 알려진 위치(예: RTK로 관측된 포인트)가 없으면 그 관측은 적용되지 않습니다.


[새 레이어] 대화 상자

이 대화 상자를 이용하여 새 레이어를 만듭니다. 이것은 개체(포인트, 선, 호, 곡선, 텍스트)를 삽입 또는 편집할 때, 존재하지 않는 레이어 이름을 입력할 경우 나옵니다.

이름

선택한 개체를 이동시킬 대상 레이어의 이름을 입력합니다.

포인트 스타일

목록에서 포인트 스타일을 하나 선택합니다. 목록에는 Trimble 스타일은 물론, 사용자가 Trimble Geomatics Office에서나([편집 / 스타일] 명령을 이용하여) 피쳐 코드 처리 과정에서(자세한 사항은 Feature and Attribute Editor 유틸리티 도움말 참조) 새로 만든 포인트 스타일이 나옵니다.

선택한 포인트 스타일은 이 레이어의 모든 포인트(지정 포인트 스타일이 <레이어 기준>인)에 적용됩니다.

선 스타일

목록에서 선 스타일을 하나 선택합니다. 목록에는 Trimble 스타일은 물론, 사용자가 Trimble Geomatics Office에서나([편집 / 스타일] 명령을 이용하여) 피쳐 코드 처리 과정에서 새로 만든 선 스타일이 나옵니다.

선택한 선 스타일은 이 레이어의 모든 선(지정 선 스타일이 <레이어 기준>인)에 적용됩니다.

텍스트 스타일

목록에서 텍스트 스타일을 하나 선택합니다. 목록에는 Trimble 스타일은 물론, 사용자가 Trimble Geomatics Office에서 [편집 / 스타일] 명령으로써 새로 만든 텍스트 스타일이 나옵니다.

선택한 텍스트 스타일은 이 레이어의 모든 텍스트와 주석(지정 텍스트 스타일이 <레이어 기준>인)에 적용됩니다.

보호

이 확인란을 선택 해제하면, Trimble Geomatics Office 그래픽 창에서 그 레이어의 개체를 선택할 수 있게 됩니다. 이 확인란을 선택하면 그 레이어의 개체를 선택할 수 없습니다. 이 필드의 값은 레이어 도구 모음의 [레이어 선택] 도구 단추에서 표시됩니다.

레이어가 보호 상태(locked)일 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

레이어가 보호 상태가 아닐 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

[보호] 필드가 선택 상태인 레이어가 하나 이상 있을 경우, [image] 아이콘이 상태 표시줄에 나타납니다.

참조: 이 확인란을 선택하면, 다음의 어떤 방법으로도 그 레이어에 있는 개체를 볼 수 없습니다.

  등록 정보 창을 이용하는 방법

  마우스로 개체를 클릭하여 선택하는 방법

  [선택] 메뉴의 명령 항목을 이용하는 방법

표시

이 확인란을 선택하면 그래픽 창에서 그 레이어의 개체를 볼 수 있습니다. 이 필드의 값은 레이어 도구 모음의 [레이어 선택] 도구 단추에서 표시됩니다.

레이어가 표시 상태일 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

레이어가 표시 상태가 아닐 경우, [image] 아이콘이 레이어 도구 모음에 나옵니다.

레이어의 개체를 숨기려면 이 확인란을 선택 해제합니다.

참조: 이 확인란을 선택 해제하면, 그 레이어의 개체를 Trimble Geomatics Office 그래픽 창에서 볼 수 없습니다.

하나 이상의 레이어가 숨겨져 있으면, '숨겨진 레이어' 아이콘 [image] 이 상태 표시줄에 나타납니다. 즉, 이 아이콘은 '표시' 속성이 선택 해제되어 있는 레이어가 하나 이상일 때 상태 표시줄에 나타납니다.

주의: 레이어가 숨겨진 상태일 경우, 그 레이어의 개체를 보거나 선택할 수 없습니다. 이것은 그 레이어가 보호 상태이든, 그렇지 않든 상관없이 적용됩니다. 즉, '표시' 옵션이 '보호' 옵션에 우선합니다.


[포인트 및 텍스트 이동] 명령

[이동] 대화 상자를 불러오는 명령입니다. 이 명령은 현재의 선택 집합이 있을 경우에만 이용할 수 있는데, [편집 / 포인트 및 텍스트 이동]을 선택하여 실행합니다.

[이동] 대화 상자가 나옵니다.


[이동] 대화 상자

이 대화 상자를 이용하여 포인트나 텍스트를 이동합니다.

이 대화 상자는 [편집 / 포인트 및 텍스트 이동] 명령을 실행하여 불러옵니다.

기준 등급이나 고정 기준 등급, 조정 등급의 포인트는 이동하지 못합니다. 이동하고자 선택한 포인트가 조정 등급이나 고정 기준 등급, 기준 등급일 경우에는 메시지가 나옵니다.

경고: 어떤 포인트를 이동하면 그 좌표나 관측치가 불이용 상태로 전환되게 되지만 등록 정보 창으로써 이들을 다시 이용 상태로 만들 수 있습니다. 관측치와 좌표를 이용 상태로 복귀시키면 이동된 포인트가 원래 위치로 되돌아갈 수 있습니다.

포인트나 텍스트를 선택하고, 대화 상자에서 새 위치를 입력합니다. [확인] 단추를 누르면 이동이 이루어집니다.

이동 정도

선택한 텍스트나 포인트를 이 값만큼 새 위치로 옮깁니다.

2가지 옵션:

델타 E	선택한 모든 개체의 Y 좌표에 이 델타 E 값을 합산합니다.

델타 N	선택한 모든 개체의 X 좌표에 이 델타 N 값을 합산합니다 .

포인트로 이동

선택한 포인트를 다른 포인트의 위치로 옮기려면 이 확인란을 선택합니다.

이름

이 필드를 이용하여 새 위치에 있는 포인트를 선택하거나 그 이름을 입력합니다.

좌표로 이동

선택한 포인트나 텍스트를 새 위치로 옮기려면 이 확인란을 선택합니다. 2가지 옵션이 있습니다.

Y 좌표	선택한 포인트에 대하여 새 Y 좌표 값을 선택하거나 입력합니다.

X 좌표	선택한 포인트에 대하여 새 X 좌표 값을 선택하거나 입력합니다.

표고를 공백값으로 설정

이동한 포인트의 표고를 공백값으로 설정하려면 이 확인란을 선택합니다. 이 옵션을 택하지 않을 경우에는 그 포인트의 기존 표고가 그대로 유지됩니다.

참조: 이동한 포인트에 대한 관측치는 모두 이용되지 않게 됩니다.


[중복 포인트] 대화 상자

추가 정보

 기타

프로젝트의 어떤 포인트와 이름이 같은 포인트가 들어 있는 파일을 가져올 경우, 동명의 포인트가 그 프로젝트에 생기게 됩니다. 이 때 다음과 같은 메시지의 [중복 포인트] 대화 상자가 나옵니다.

″이 가져오기 작업으로 말미암아 데이터베이스에 이름이 같은 포인트(중복 포인트)들이 생겼습니다. ″

중복 포인트의 해소 방법:

  물리적으로 동일한 포인트이면 중복 포인트를 병합

  물리적으로 동일한 포인트가 아니면 중복 포인트의 이름을 변경


피드백

본 소프트웨어의 매뉴얼이나 도움말 등에 관한 여러분의 의견은 보다 나은 개정판의 토대가 됩니다.

의견이나 제안을 보내시고자 하는 경우에는

  전자 우편(ReaderFeedback@trimble.com)을 이용하거나

  매뉴얼의 마지막 장에 있는 Reader Comment Form(고객 의견서)을 작성한 후, 그 하단의 우송 요령에 따라 보내 주시면 감사하겠습니다. 고객 의견서 양식을 구할 수 없는 분들은 양식에 상관 없이 의견이나 제안을 다음 주소로 보내셔도 됩니다.

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

USA

Attention: Technical Publications Group

팩스: +1 720 887-6101

www.trimble.com/

접수된 의견이나 제안은 모두 당사의 소유가 됩니다.

대단히 감사합니다.


[새 프로젝트] 명령

새 프로젝트나 새 템플리트를 만드는 명령입니다.

이 명령은 다음 중 하나의 방식으로 실행합니다.

  [파일 / 새 프로젝트]를 선택합니다.

  표준 도구 모음의 [새 프로젝트] 단추 [image] 를 누릅니다.

[새 프로젝트] 대화 상자가 나옵니다.


[새 프로젝트] 대화 상자

새 프로젝트나 새 템플리트를 만드는 대화 상자입니다.

이 대화 상자는 다음 중 하나의 방식으로 불러옵니다.

  [파일 / 새 프로젝트] 명령을 실행합니다.

  표준 도구 모음의 [새 프로젝트] 단추 [image] 를 누릅니다.

  프로젝트 표시줄의 [새 프로젝트] 바로 가기를 누릅니다.

이름

만들 프로젝트의 이름을 입력합니다. [폴더] 단추를 이용하여 선택하는 경우와 마찬가지로, 이 프로젝트 이름의 새 폴더가 현행 프로젝트 폴더 아래에 만들어집니다.

템플리트

[템플리트] 상자에는 사용자의 시스템에 있는 프로젝트 템플리트가 모두 표시됩니다. Trimble Geomatics Office에서 프로젝트 템플리트를 이용하는 것은 Microsoft Word의 서식 문서나 AutoCAD의 프로토타입 그림을 이용하는 것과 유사합니다. 프로젝트를 새로 만들 때 템플리트를 이용하면 손쉽게 작업을 할 수 있습니다. 템플리트는 이용을 하더라도 수정되지 않습니다.

팁: 템플리트에 추가된 새 CAD 스타일은 이 템플리트를 이용하는 모든 프로젝트에서 이용할 수 있습니다. 어떤 지역에서 진행 중인 작업이 일련의 프로젝트를 요할 경우에는 그 지역의 특정 좌표계와 특수한 스타일, 기준점 등을 포함하는 템플리트를 만들면, 이것을 모든 새 프로젝트에서 이용할 수 있습니다.

일단 어떤 프로젝트 템플리트를 정의하게 되면, 서로 다른 여러 프로젝트에 이것을 여러 번 이용할 수 있습니다.

템플리트 목록에서 최적의 템플리트를 선택합니다. 선택한 템플리트는 새로 만들 프로젝트의 뼈대를 이룹니다.

상세 명세

[상세 명세] 상자에는 선택된 템플리트의 표제와 좌표계 내역이 표시됩니다. 이 정보는 최적 템플리트의 선택에 도움이 됩니다.

새 프로젝트가 위치할 폴더도 나타납니다. 이 폴더는 [이름] 필드에서 직접 정한 것이나 [폴더] 단추를 이용하여 정한 것이 모두 반영됩니다.

투영법 옵션은 템플리트 프로젝트에서 사전 정의되는데, 이 투영법은 수정할 수 있습니다.

폴더

새 프로젝트가 위치할 폴더를 선택하려면 이 단추를 누릅니다.

[폴더] 단추를 이용하여 폴더를 선택하면 그 다음부터 프로젝트를 만들거나 불러올 때, Trimble Geomatics Office에서 쓰는 기본값 폴더가 변경되게 됩니다.

[폴더 찾아보기] 대화 상자에 나오는 폴더 트리 구조를 이용하여,

  어떤 프로젝트 폴더를 직접 선택하거나

  많은 프로젝트가 들어 있는 폴더를 선택합니다.

새로 만들기

새 프로젝트나 새 템플리트를 만들려면 [새로 만들기]를 누릅니다.

'템플리트' 옵션을 선택하면 현재 선택한 템플리트를 바탕으로 적당한 폴더에 새 템플리트를 만들 수 있습니다.


[프로젝트 열기] 명령

기존 프로젝트를 불러오는 명령입니다.

이 명령은 다음 중 하나의 방식으로 실행합니다.

  [파일 / 프로젝트 열기]를 선택합니다.

  표준 도구 모음의 [프로젝트 열기] 단추 [image] 를 누릅니다.

 [프로젝트 열기] 대화 상자가 나옵니다.


[프로젝트 열기] 대화 상자

기존 프로젝트를 불러오는 대화 상자입니다.

이 대화 상자는 다음 중 하나의 방식으로 불러옵니다.

  [파일 / 프로젝트 열기] 명령을 실행합니다.

  표준 도구 모음의 [프로젝트 열기] 단추 [image] 를 누릅니다.

참조: 현재 작업 중인 프로젝트가 있을 때 이 명령을 실행하면, 현행 프로젝트가 닫기게 된다는 경고 메시지가 나옵니다.

참조: 프로젝트의 미리 보기가 이 대화 상자에 나옵니다.

이름

불러오고자 하는 프로젝트의 이름을 입력합니다.

현행 프로젝트 폴더에 있는 프로젝트의 목록이 [이름] 필드 아래에 나옵니다. 이 목록에서 하나를 선택하면 그 이름이 [이름] 필드에 자동 입력됩니다.

불러오고자 하는 프로젝트의 경로를 이 필드에 입력할 수도 있습니다.

예를 들어, C:\ 드라이브의 폴더 MYPROJ에 프로젝트가 여러 개 있다고 할 때,

C:\myproj\라 입력하면 이 폴더에 있는 프로젝트가 모두 표시되는데, 그 중에서 선택을 하면 됩니다. 이 방식으로 프로젝트를 불러오면 [폴더] 단추를 이용하는 경우와는 달리, 프로젝트의 기본값 폴더가 바뀌지 않습니다. [폴더] 단추에 대한 다음 설명을 참조하십시오.

폴더

불러오고자 하는 프로젝트가 위치한 폴더를 선택하려면 이 단추를 누릅니다.

[폴더 찾아보기] 대화 상자에 나오는 폴더 트리 구조를 이용하여,

  어떤 프로젝트 폴더를 직접 선택하거나

  많은 프로젝트가 들어 있는 폴더를 선택합니다.

상세 명세

[상세 명세] 상자에는 프로젝트의 좌표계와 표제, 그리고 프로젝트의 저장 폴더가 표시되므로 적합한 프로젝트를 불러오는 데 도움이 됩니다. 이 상자의 내용을 수정하려면 [파일 / 프로젝트 등록 정보] / [단위와 포맷] 탭을 이용합니다.

참조: WAVE Baseline Processing 모듈이나 Network Adjustment 모듈로써 만든 프로젝트를 불러올 경우, 이 모듈이 설치되어 있지 않다면, 그 측량 데이터(오차 타원이나 처리된 기선 같은)를 볼 수는 있지만 변경할 수 없습니다. 즉, 이 모듈이 있어야만 가능한 작업은 할 수 없습니다.


[프로젝트 닫기] 명령

현재 작업 중인 프로젝트를 닫는 명령입니다.

이 명령은 [파일 / 프로젝트 닫기]를 선택하여 실행합니다.

프로젝트의 변경 사항(저장된 선택 집합이나 보기 화면)은 작업을 하는 과정에서 모두 저장됩니다. 즉, 따로 저장할 필요 없이 프로젝트를 닫을 수 있습니다.


[프로젝트 삭제] 명령

프로젝트를 삭제하는 명령입니다.

이 명령은 [파일 / 프로젝트 삭제]를 선택하여 실행합니다.

[프로젝트 삭제] 대화 상자가 나옵니다.


[프로젝트 삭제] 대화 상자

프로젝트를 삭제하는 대화 상자로서, [파일 / 프로젝트 삭제] 명령을 실행하여 불러옵니다.

현재 작업 중인 프로젝트는 삭제할 수 없습니다.

팁: 삭제한 프로젝트라도 '휴지통'으로부터 복원할 수 있습니다.

이름

삭제하고자 하는 프로젝트의 이름을 입력합니다.

현행 프로젝트 폴더에 있는 프로젝트의 목록이 [이름] 필드 아래에 나옵니다. 이 목록에서 하나를 선택하면 그 이름이 [이름] 필드에 자동 입력됩니다.

삭제하고자 하는 프로젝트의 디렉토리 경로를 입력할 수도 있습니다.

예를 들어, C:\ 드라이브의 폴더 MYPROJ에 프로젝트가 여러 개 있다고 할 때,

C:\myproj\라 입력하면 이 폴더에 있는 프로젝트가 모두 표시되는데, 그 중에서 선택을 하면 됩니다. 이 방식으로 프로젝트를 삭제하면 [폴더] 단추를 이용하는 경우와는 달리, 프로젝트의 기본값 폴더가 바뀌지 않습니다. [삭제] 상자에 대한 다음 설명을 참조하십시오.

[삭제] 상자

삭제하고자 하는 프로젝트를 보려면 '프로젝트' 옵션을 선택합니다.

삭제하고자 하는 템플리트를 보려면 '템플리트' 옵션을 선택합니다.

폴더

삭제할 프로젝트가 위치하는 폴더를 선택하려면 이 단추를 누릅니다. [폴더] 단추를 이용하여 폴더를 선택하면 그 다음부터 프로젝트를 만들거나 불러올 때, Trimble Geomatics Office에서 쓰는 기본값 폴더가 변경되게 됩니다.

[폴더 찾아보기] 대화 상자에 나오는 폴더 트리 구조를 이용하여,

  어떤 프로젝트 폴더를 직접 선택하거나

  많은 프로젝트가 들어 있는 폴더를 선택합니다.

삭제

이 단추를 누르면 선택한 프로젝트가 삭제됩니다. 그 프로젝트에 포함된 폴더와 파일도 모두 삭제됩니다.

상세 명세

[상세 명세] 상자에는 프로젝트의 좌표계와 표제, 그리고 프로젝트의 저장 폴더가 표시되므로 삭제할 프로젝트가 올바로 선택되었는지 확인하기 편리합니다.


[가져오기] 명령

[가져오기] 대화 상자를 불러오는 명령입니다.

이 명령은 다음 중 하나의 방식으로 실행합니다.

  [파일 / 가져오기]를 선택합니다.

  표준 도구 모음의 [가져오기] 단추 [image] 를 누릅니다.

  프로젝트 표시줄의 [가져오기] 그룹을 이용합니다.

[가져오기] 대화 상자가 나옵니다.


[내보내기] 명령

데이터를 다른 포맷이나 Trimble 장치에 내보내는 명령입니다.

이 명령은 다음 중 하나의 방식으로 실행합니다.

  [파일 / 내보내기]를 선택합니다.

  표준 도구 모음의 [내보내기] 단추 [image] 를 누릅니다.

[내보내기] 대화 상자가 나옵니다.


[시트 설정] 명령

플롯을 하기에 앞서 시트의 레이아웃 설정을 변경하는 명령입니다.

이 명령으로써,

  플롯에 이용하고자 하는 도면 양식을 선택합니다.

  플롯 축척, 원점, 배향을 정합니다.

이 명령은 [파일 / 시트 설정]을 선택하여 실행합니다.

[시트 설정] 대화 상자가 나옵니다.


[시트 설정] 대화 상자

플롯을 하기에 앞서 시트의 레이아웃 설정을 변경하는 대화 상자입니다. 플롯에 이용하고자 하는 도면 양식을 선택하고 플롯 축척, 원점, 배향을 정할 수 있습니다.

이 대화 상자는 [파일 / 시트 설정] 명령을 실행하여 불러옵니다.

도면 양식

도면 양식(Plan form)은 제도 내용을 플롯하는 템플리트를 제공합니다. 이 템플리트를 알맞게 수정하여 프레임, 선 작업, 텍스트 주석 뿐만 아니라 제도 구성 요소(예: N 점 표시 화살표나 회사 로고)를 넣을 수 있습니다. 도면 양식은 선택된 프린터/플로터에 설정된 시트 크기에 적용되고, 그 프린터/플로터의 시트 방향(가로 방향/세로 방향) 설정에 따르게 됩니다.

이 설정은 [인쇄 설정]을 이용하여 변경할 수 있습니다.

원하는 도면 양식 파일의 이름을 [파일] 필드에 입력합니다.

찾아보기

[찾아보기] 대화 상자에는 이용할 수 있는 도면 양식 (*.frm) 파일의 목록이 나옵니다.

필요한 도면 양식 파일의 이름을 선택합니다.

Trimble Navigation Limited에서 제공하는 도면 양식과는 별도로, 사용자가 자신의 도면 양식을 만들 수도 있습니다. 자세한 사항은 도면 양식 � 개요를 참조하십시오.

축척, 플롯 회전, 원점 N, 원점 E

이 필드들을 이용하여 플롯 대상 프로젝트의 영역을 지정합니다.

일단 축척을 설정하면, 플롯 대상 프로젝트의 영역을 나타내는 '플롯 상자'가 그래픽 창에 나옵니다. 이것은 원점 좌표를 토대로 합니다. 플롯의 포괄 범위를 줄이거나 늘이려면 축척을 변경합니다.

팁: [플롯 회전] 필드는 플롯의 방향을 결정합니다. 이 필드의 값은 플롯 N 점의 회전도라기보다는 플롯 시트의 측면 배향도를 결정합니다. 플롯 상자는 이동할지도 모르는데 그럴 경우, 이것을 데이터 주변에 그래픽상으로 이동하여 프로젝트 데이터를 맞춥니다.

[원점 N]이나 [원점 E] 필드를 누른 다음, '플롯 상자'를 드래그하여 필요한 영역이 포함되게 합니다.

확인

플롯 시트의 설정 내용을 적용합니다. 이 설정 내역은 저장된 후, [플롯/인쇄] 옵션에서 이용됩니다.

최적 맞춤

이것을 누르면 [축척] 필드와 [원점 E], [원점 N] 필드의 최적값(현재 표시된 프로젝트 데이터를 모두 플롯에 포함시키는)이 시스템상에서 계산되게 됩니다. 이 옵션의 이용시 플롯 회전은 0�로 설정됩니다.

인쇄 설정

이것을 누르면 [인쇄 설정] 대화 상자가 나옵니다. 이 대화 상자를 이용하여 프린터/플로터, 용지 크기와 용지 공급, 용지상에서의 플롯 출력 방향(가로 또는 세로) 등을 선택합니다.


도면 양식 - 개요
도면 양식 − 개요

도면 양식 (*.frm) 파일은 텍스트 파일로서 저장되는데, 도면 양식(Plan Form)의 내용과 배치에 관한 일련의 설명문이 들어 있습니다. 도면 양식 정의에 선이나 텍스트, 심벌(예: N 점), Microsoft Windows Metafile(*.wmf)을 넣어 필요한 레이아웃을 구성할 수 있습니다.

메모

소프트웨어에 딸려 있는 도면 양식에는 그 정의에 쓰이는 각종 명령어의 뜻을 설명하는 메모가 있습니다. 도면 양식의 정의는 텍스트 편집기를 이용하여 편집합니다. 소프트웨어에 딸린 도면 양식 정의는 일반적으로 주 프로그램 폴더(보통 C:\Program Files\Trimble\Trimble Geomatics Office) 하의 System 폴더에 들어 있습니다.

팁: Trimble Geomatics Office의 설치 과정에서 Microsoft 메모장이 .frm 파일의 연결 프로그램으로 지정됩니다. 따라서 도면 양식 파일을 선택하는 경우, 또는 Microsoft Windows 탐색기에서 .frm 파일을 하이라이트하는 경우, 바로 가기 메뉴상의 '열기' 옵션을 이용하여 도면 양식 내역을 Microsoft 메모장으로 읽어 들일 수 있습니다.

보다 자세한 사항은 도면 양식 정의 내역을 참조하십시오.


도면 양식 정의 내역

 개요

도면 양식(Plan Form) 정의는 표준 Windows  *.ini 파일과 유사한 포맷으로 저장됩니다. 이것은 꺾쇠 괄호([ ])가 있는 여러 개의 섹션 표제로 구성됩니다. 각 섹션에는 정의된 개별 항목들이 있는데, 각 항목은 자신의 고유한 이름이 있고 '=' 문자로써 알맞은 값이 지정됩니다. 또한 이 파일 안에는 메모를 둘 수 있지만, 반드시 세미콜론(;)으로 시작하는 별도의 행이어야 합니다.

도면 양식 정의는 특수한 좌표 체계를 토대로 하기 때문에 플롯 시트의 크기가 달라도 동일한 도면 양식을 이용할 수 있습니다. 모든 좌표 값은 mm 단위이며 괄호 안에 콤마로 구분된 값이 1 쌍 있는데, X (수평) 값이 먼저 나오고 Y (수직) 값이 나중에 나옵니다. 즉, (20,40)이라는 형식을 취합니다.

플롯 가능한 시트 좌측 상단 코너 지점의 좌표를 +0.0, +0.0으로 정의하므로 양수의 좌표 값은 모두 이 위치의 우측과 아래인 것으로 해석합니다. 또한, 플롯 가능한 시트 우측 하단 코너 지점의 좌표를 �0.0, �0.0으로 정의하므로 음수의 좌표 값은모두 이 위치의 좌측과 위인 것으로 해석합니다.

참조: 플롯 가능한 시트 코너는 특정 시트에서 플로터/프린터가 실제로 플로팅/인쇄를 할 수 있는 한계 지점입니다. 이 한계는 플로터/프린터의 종류에 따라 달라지는데, 예를 들어 플로터의 롤러에 시트가 놓이는 방식에 따라 플롯의 한계 지점이 달라집니다.

다음은 좌표 위치의 해석 예시표입니다.

섹션

다음은 도면 양식 정의 파일의 섹션입니다.


[플롯/인쇄] 명령

이 명령을 이용하여,

  설치된 플로터와 프린터의 목록을 봅니다.

  기본값으로 쓸 플로터나 프린터를 설정합니다.

  선택한 플로터나 프린터에 대한 기타 옵션을 설정합니다.

이 명령은 다음 중 하나의 방식으로 실행합니다.

  [파일 / 플롯/인쇄]를 선택합니다.

  <Ctrl+P>를 누릅니다.

Trimble Geomatics Office에서 인쇄 작업을 수행할 수 있기 위해서는 먼저,

  플로터/프린터를 사용자의 컴퓨터나 네트워크에 연결하여야 합니다.

  플로터/프린터 드라이버가 없다면 Microsoft Windows 설정이나 Microsoft Windows 제어판을 이용하여 이를 설치하도록 합니다. 보다 자세한 사항은 Microsoft Windows 도움말을 참조하십시오.

  사용하고자 하는 플로터나 프린터를 [플롯/인쇄 설정] 대화 상자에서 선택합니다.

참조: 그리드 선이 그래픽 창에 표시되게 설정하였다면, 플롯에 이 선이 그려집니다.


[프로젝트 등록 정보] 명령

[파일 / 프로젝트 등록 정보] 명령을 실행하여 [프로젝트 등록 정보] 대화 상자를 불러옵니다.


최근 이용 프로젝트 명령

최근 불러온 프로젝트 4개의 목록이 [파일] 메뉴에 나옵니다.

불러오고자 하는 프로젝트를 이 목록에서 하나 선택합니다.


[종료] 명령

현재 작업 중인 프로젝트를 닫고 Trimble Geomatics Office를 종료합니다.

Trimble Geomatics Office는 변경 사항을 자동 저장합니다.


[프로젝트 복사] 명령

기존 Trimble Geomatics Office 프로젝트의 복사본을 만드는 명령입니다. 이 명령은 열려 있는 프로젝트가 없을 경우에만 실행할 수 있습니다.

[복사할 프로젝트] 대화 상자가 나옵니다.


[복사할 프로젝트] 대화 상자

복사하고자 하는 프로젝트를 선택하는 대화 상자입니다.

이 대화 상자를 불러오려면,

  [파일 / 프로젝트 복사] 명령을 실행합니다.

이 옵션은 열려 있는 프로젝트가 없을 경우에만 가능합니다.

목록에서 프로젝트를 선택합니다.

선택한 그 프로젝트의 내역이 프로젝트 목록 아래에 나옵니다.

폴더

프로젝트를 다른 폴더에서 선택하려면 [폴더] 단추를 누릅니다.

복사하고자 하는 프로젝트를 선택한 다음, [확인] 단추를 누릅니다.

[새 복사 프로젝트] 대화 상자가 나옵니다.


[새 복사 프로젝트] 대화 상자

복사해서 새로 만들어 낼 프로젝트의 이름을 입력합니다.

프로젝트 이름

새 프로젝트의 이름을 입력합니다.

폴더

처리 옵션:

  프로젝트를 다른 폴더에 복사하려면 생략 부호 단추를 누릅니다.

  그 폴더 경로를 키보드로 직접 입력합니다.


파일 전송 프로토콜(FTP) 사이트

Trimble FTP 사이트를 이용하여 소프트웨어 패치나 유틸리티, FAQ(자주 나오는 질문)에 대한 답 등 각종 파일을 주고 받을 수 있습니다. 이 FTP 사이트는 Trimble World Wide Web 사이트로부터 액세스할 수 있습니다. www.trimble.com/support/support.htm


GIS 포맷 - 개요
GIS 포맷 − 개요

추가 정보

방법 ...	기타
개요

Trimble Geomatics Office에서 포인트와 그 관련 속성을 다양한 GIS(지리 정보 시스템) 포맷으로 내보낼 수 있습니다. 선이나 호, 곡선, 텍스트, 주석은 내보낼 수 없습니다.

다음 표를 참조하십시오.

포맷	시스템	이용하는 경우
Arcview shape 파일	ArcView 버전 2 및 ARC/INFO 버전 7, PC-ARC/INFO	각 피쳐에 대하여 .shp, .shx, .dbf 파일을 만들 때. Shape 파일들은 ArcView 버전 2로써 직접 읽어오고 ARC/INFO 버전 7에 가져올 수 있습니다.
속성이 있는 AutoCAD	GIS AutoCAD	.dxf 파일(블럭이 있는 것이나 없는 것)을 만들 때
MapInfo	MapInfo	각 피쳐에 대하여 .mid, .mif 파일을 만들 때.  MapInfo Interchange 포맷(.mif)은 MapInfo에서 그래픽 데이터나 표 형식의 데이터를 서로 다른 컴퓨터 플랫폼 사이에 교환할 때 이용합니다.
Microstation DGN	Microstation	.dgn 파일을 만들 때. MicroStation Design (.dgn) 파일은 MicroStation의 표준 그래픽 포맷입니다.

내보내기 과정에서, 새 속성(예: 속성 수집 날짜와 시간, 포인트의 표고)을 만들어 내보낼 수 있습니다.

사용자 정의 ASCII 내보내기나 보고서 포맷을 만들어 포인트와 그 관련 속성을 내보낼 수도 있습니다.

사용자 정의 GIS 포맷 2 가지:

  이름,위도,경도,타원체고,모든 속성 (로컬)

  이름,X 좌표,Y 좌표,표고,모든 속성

[GIS] 탭을 이용하면 데이터를 다양한 GIS 포맷에 내보낼 수 있습니다.

이 탭을 액세스하려면,

1.	다음 중 하나를 실행합니다.

  [파일 / 내보내기]를 선택합니다.

  프로젝트 표시줄의 내보내기 그룹을 이용합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[GIS] 탭을 선택합니다.

사용자 정의의 포맷을 이 탭으로 이동할 수 있습니다. 자세한 사항은 Asciiexp.dat 파일 참조.

GIS 포맷으로의 내보내기에 대한 자세한 내용은 GIS 내보내기 포맷을 참조하십시오.

이 탭에는 다음과 같은 포맷이 있습니다.


ArcView 파일 (*.dbf, *.shp, *.shx) 옵션

ArcView 포맷에 내보내기를 하는 경우, 속성이 있는 각 피쳐 코드 당 3개의 파일이 만들어집니다.

다음 표는 이 파일들에 대한 설명입니다.

이들은 2진 파일이기 때문에 텍스트 편집기로써 보거나 편집할 수 없습니다.

이 파일들의 이름은 Trimble Geomatics Office에서 자동으로 부여됩니다.

예를 들어, 그 피쳐 코드 이름이 'Tree'이라면, 다음과 같은 파일이 만들어집니다.

  Tree.shp

  Tree.shx

  Tree.dbf

ArcView 설정에 대한 자세한 사항은 [내보내기 옵션] 대화 상자를 참조하십시오. ArcView는 모든 포맷에 공통적으로 적용되는 표준 설정을 제외하고는 자체의 고유한 별도 설정을 요하지 않습니다.

참조: ArcView 버전 3.1 이상만 3D 포인트를 지원합니다.


속성이 있는 AutoCAD 파일 (*.dxf) 옵션

이 옵션 하에서는.dxf 파일이 만들어집니다.

Drawing eXchange 포맷 (.dxf) 파일은 그래픽 데이터나 표 형식의 데이터를 교환하고 디스플레이 하는 용도에 이용됩니다.

설정

[내보내기 옵션] 대화 상자 항목에서 설명하는 표준 설정 이외에 AutoCAD만의 고유한 설정도 있습니다.

옵션을 누르면 [내보내기 옵션] 대화 상자가 나옵니다.

텍스트 크기

출력 파일의 텍스트 크기를 지정하는 옵션은 다음 2가지입니다.

자동	입력 파일로부터 텍스트 크기가 자동 계산됨
고정	다음 중 하나의 방법으로 텍스트 크기를 고정   원하는 크기를 [텍스트 크기] 필드에 입력   화살표 단추를 이용
블럭 옵션

블럭으로 속성 정보를 내보내고자 하면 [블럭으로 피쳐 내보내기] 확인란을 선택합니다. 그러면 DXF 포맷을 지원하는 GIS나 CAD 시스템으로 속성을 읽어 들일 때, 질의와 편집을 할 수 있게 됩니다. [블럭 삽입점] 상자가 활성화되는데, 블럭에 삽입점을 두는 옵션은 다음 2가지입니다.

  원점	삽입점을 블럭의 원점(0,0) 위치에 둠

  중심점	삽입점을 블럭의 계산된 중심점에 둠

[블럭으로 피쳐 내보내기] 확인란을 선택하지 않으면 이 옵션을 이용하지 못합니다. 대신 피쳐의 위치 정보는 POLYLINE이나 POINT 개체로서 저장되고 속성 정보는 TEXT 로서 기록됩니다. TEXT는 각 피쳐의 해당 레이어에 기록됩니다. 또한 [블럭 삽입점] 상자가 활성화 되지 않습니다.

참조: 블럭으로 내보내지 않으면 속성 값만 내보낼 수 있고 속성 이름은 내보낼 수 없습니다. 따라서 AutoCAD Map 등과 같은 AutoCAD GIS 패키지로 내보내기를 하는 경우, 항상 블럭으로 내보냄으로써 속성 이름이 포함되도록 합니다.

레이어 옵션

DXF 파일은 서로 다른 정보를 레이어 속으로 조직화합니다. 이 레이어는 상호 독립적으로 조작할 수 있습니다. 2가지의 레이어 옵션이 있습니다.

  레이어당 한 피쳐 − 각 피쳐에 대하여 서로 다른 레이어가 만들어집니다. 예를 들어, pole 피쳐가 위치하는 레이어와 tree 피쳐가 위치하는 레이어는 서로 다릅니다. 각 레이어의 이름은 그 피쳐의 이름입니다.

  한 레이어에 모든 피쳐 − 모든 피쳐가 단 하나의 레이어에 위치합니다. 이 옵션을 택하면 [레이어 이름] 필드가 활성화되는데, 여기에 레이어의 이름을 입력합니다. 이 필드를 공백으로 두면 안됩니다.

피쳐 이름의 스페이스를 밑줄로 바꿈

DXF 파일을 처리하는 프로그램 중에는 그 파일의 레이어 이름에 스페이스를 허용하지 않는 것이 있습니다. 이 옵션을 택하면 피쳐 이름의 스페이스는 모두 밑줄 문자(_)로 바뀝니다.


MapInfo 파일 (*.mif, *.mid) 옵션

MapInfo 포맷에 내보내기를 하는 경우, 속성이 있는 각 피쳐 코드 당 2개의 파일이 만들어집니다. 다음 표는 이 파일들에 대한 설명입니다.

이들은 텍스트 파일이므로 텍스트 편집기로써 보거나 편집할 수 있습니다. 다음은 이 두 파일의 예시입니다.

MIF 파일

VERSION 2

  DELIMITER "	"

  COORDSYS EARTH PROJECTION 1, 104

COLUMNS 3

  Height_m  DECIMAL(5,0)

  Needs_attention  CHAR(30)

  Remarks  CHAR(30)

DATA

POINT 700345.32 306565.45

POINT 700356.47 306125.38

POINT 700937.71 306505.41

MID 파일

1	Yes	Branches in wires

2	Yes	Dead

3	No	Directly beside pole

Trimble Geomatics Office는 이 두 파일의 이름을 자동으로 부여합니다. 예를 들어, 해당 피쳐 코드 이름이 'tree'이라면, 다음과 같은 파일이 만들어집니다.

  tree.mif

  tree.mid

MapInfo는 모든 포맷에 공통적으로 적용되는 표준 설정을 제외하고는 자체의 고유한 별도 설정을 요하지 않습니다. 이 설정 내용은 [내보내기 옵션] 대화 상자 항목을 참조하십시오.

참조: MapInfo는 2D 포인트만 지원합니다.


Microstation 파일 (*.dgn) 옵션

Microstation (*.dgn) 포맷에 내보내기를 하는 경우, 1개의 파일이 만들어집니다. 내보내고자 하는 파일의 이름을 입력하여야 합니다.

설정

[내보내기 옵션] 대화 상자의 표준 설정 이외에도 Microstation DGN 포맷으로의 내보내기 설정에 대한 별도 옵션이 있습니다.

스냅 가능하게 함

이 확인란을 선택하는 경우, 만들어지는 DGN 파일에 '스냅 가능(snapable)' 피쳐가 생깁니다. 따라서 그 피쳐 부근을 클릭하면 커서가 해당 피쳐의 정확한 위치로 스냅이 됩니다.

해상 단위

출력 파일의 GPS 위치에 대한 해상 단위(Unit of resolution)를 입력합니다. 사용자의 GPS 데이터를 DGN 포맷의 기존 데이터로써 덧씌우고자 하면 두 파일의 해상 단위가 같아야 합니다.

2가지 옵션:

  자동 − 해상 단위는 Trimble Geomatics Office 프로젝트에서 [파일 / 프로젝트 등록 정보] / [단위와 포맷] 탭의 [좌표 소수 자리] 필드로부터 자동 계산됩니다.

  사용자 정의 − 사용자가 이 필드에서 해상 단위를 직접 명시할 수 있습니다.

전지구 원점

전지구 원점(Global origin)의 계산 방법을 선택합니다. 사용자의 GPS 데이터를 DGN 포맷의 기존 데이터로써 덧씌우고자 하면 두 파일의 전지구 원점이 같아야 합니다.

2가지 옵션:

  자동 � 전지구 원점은 입력 파일로부터 자동 계산됩니다.

  사용자 정의 � 사용자가 이 필드에서 전지구 원점의 X, Y, Z 좌표를 직접 명시할 수 있습니다.


[내보내기 옵션] 대화 상자 (GIS 내보내기)

이 대화 상자를 이용하여 지리 정보 시스템(GIS) 포맷에 대한 옵션을 수정합니다.

이 대화 상자를 불러오려면,

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[GIS] 탭 하에서 [옵션]을 누릅니다.

참조: 이 대화 상자에 있는 옵션 사항은 선택한 내보내기 포맷 여하에 따라 달라집니다. 각 설정 내용은 해당되는 포맷 항목을 참조하십시오.

  Arcview 파일 (*.dbf, *.shp, *.shx)

  속성이 있는 AutoCAD 파일 (*.dxf)

  MapInfo 파일 (*.mif, *.mid)

  Microstation 파일 (*.dgn)

아래는 포맷에 상관없이 공통적으로 적용되는 설정 항목입니다.

파일 포맷

3가지의 파일 포맷이 있습니다.

  DOS 포맷

대상 시스템이 MS-DOS 하에서 운영되거나, MS-DOS ASCII 문자 집합의 텍스트를 포함하는 경우, 이 옵션을 선택합니다. 이 포맷의 텍스트 파일에는 <CarriageReturn> <NewLine> 레코드 종료 문자가 있습니다.

  Windows 포맷

대상 시스템이 Microsoft Windows 하에서 운영되거나, ANSII 문자 집합의 텍스트를 포함하는 경우, 이 옵션을 선택합니다. 이 포맷의 텍스트 파일에는 <CarriageReturn> <NewLine> 레코드 종료 문자가 있습니다.

  UNIX 포맷

대상 시스템의 운영 체제가 UNIX인 경우, 이 옵션을 선택합니다. 이 포맷의 텍스트 파일에는 <NewLine> 레코드 종료 문자가 있습니다.

참조: 각 GIS 포맷에는 그에 알맞은 파일 포맷만 이용할 수 있습니다.

차원

3차원 포인트를 지원하는 GIS 포맷의 경우에는 2차원 포인트(X 좌표, Y 좌표)나 3차원 포인트(X 좌표, Y 좌표, 표고)를 내보낼 수 있습니다. GIS 포맷이 3D 포인트를 지원하지 않는다면, 이 옵션은 이용할 수 없습니다.

팁: GIS가 3D 포인트를 지원하지 않는 경우, 표고를 내보내고자 한다면 속성을 눌러 '포인트 표고' 옵션을 선택합니다.

속성

속성을 만들어 포인트와 함께 내보내고자 하면 속성을 누릅니다. [속성] 대화 상자가 나옵니다. 이것을 이용하여 메뉴 속성 값의 내보내기 형식도 설정합니다.

참조: [속성] 대화 상자에 있는 옵션은 GIS 포맷에 상관없이 모두 동일합니다.


[속성] 대화 상자 (GIS 내보내기 옵션)

파일 내보내기에 포함시키고자 하는 속성 값을 선택하려면 이 대화 상자를 이용합니다. 이 속성은 데이터베이스에 포인트와 함께 저장된 값을 토대로 생성됩니다. 사용자가 이 대화 상자에서 임의의 속성을 만들 수는 없습니다.

[속성] 대화 상자에 있는 옵션은 GIS 포맷에 상관없이 모두 동일합니다.

만들 속성

여기에 있는 여러 옵션을 적절히 결합하여 선택함으로써, 내보내는 각 포인트에 추가할 속성을 만듭니다. 이것은 2D GIS로의 내보내기시, 표고도 내보내고자 하는 경우에 유용하게 쓰입니다. 이 때 생성된 속성은 GIS 소프트웨어에서 정상적인 속성으로 나타납니다.

참조: 날짜 속성과 시간 속성은 피쳐 및 속성 라이브러리에 설정되어 있는 포맷대로 만들어져 송출되게 됩니다.

메뉴 속성의 내보내기 형식

피쳐 및 속성 라이브러리 (*.fcl) 파일이나 데이터 딕셔너리 (*.ddf) 파일을 정의할 때, 각 메뉴 속성 항목당 2개까지의 코드 값을 명시할 수 있습니다.

예를 들어, 피쳐 코드 'Tree'의 경우, '수종'이라는 메뉴 속성이 있다고 할 때, 수종 '토착목'의 코드 값은 NV 와 NT로 할 수 있습니다. Tree 피쳐 코드의 포인트는 그 '수종' 속성을 실제 속성 값(예: 토착목)이나 '사용자 코드 1'(예: NV), '사용자 코드 2'(예: NT)로서 내보낼 수 있습니다. 이것은 사용자의 GIS가 2 문자 속성 값만 지원할 때 유용하게 쓰입니다.

코드 값에 대한 자세한 사항은 Trimble Feature and Attribute Editor 유틸리티의 도움말을 참조하십시오.


[도움말 항목] 명령

온라인 도움말을 불러오는 명령입니다.


[잠깐만] 명령

Trimble Geomatics Office 소프트웨어의 이용과 관련, 유익한 정보를 제공하는 기능입니다.

이 명령을 실행하면 유익한 정보가 나옵니다.

Trimble Geomatics Office 소프트웨어를 시작할 때 이 정보를 표시하고자 하면 [시작시 팁 표시] 확인란을 선택합니다.


[잠깐만] 대화 상자

Trimble Geomatics Office 소프트웨어의 이용과 관련, 유익한 정보를 제공하는 기능입니다.

Trimble Geomatics Office 소프트웨어를 시작할 때 이 정보를 표시하고자 하면 [시작시 팁 표시] 확인란을 선택합니다.


[Trimble Geomatics Office 정보] 명령

 방법...

Trimble Geomatics Office 소프트웨어의 프로그램 정보, 저작권 정보, 버전 번호 등을 나타냅니다.


[Trimble Geomatics Office 정보] 대화 상자

Trimble Geomatics Office 소프트웨어의 프로그램 정보, 저작권 정보, 버전 번호 등을 나타냅니다.


도움말 이용하기

Trimble Geomatics Office 소프트웨어에서 도움말을 불러오는 방법은 여러 가지가 있습니다.

대화 상자에서 도움말 불러오기	대화 상자가 활성 상태인지 확인하고 F1키를 누릅니다.
메뉴 명령에 대한 도움말 불러오기	1. 해당 메뉴 명령에 커서를 두고 마우스의 왼쪽 단추를 누른 상태에서 2. F1키를 누릅니다.
도움말 목차를 이용하여 필요한 항목 찾기	[목차] 탭을 선택한 다음, 마치 책과 같이 범주별로 구성된 항목을 찾아봅니다.
도움말 색인을 이용하여 필요한 항목 찾기	[색인] 탭을 선택하면 색인 항목의 목록이 나옵니다. 찾을 키워드를 입력하거나 목록을 스크롤합니다.
도움말에서 용어나 구를 찾기	1. [검색] 탭을 선택합니다. 2. Find Setup wizard(찾기 설정 마법사)가 나오는 경우, Minimize database size(데이터베이스 크기 최소화) 옵션을 선택하고 [다음>]에 이어 [종료]를 누릅니다. 3. 찾고자 하는 단어나 구를 [찾을 키워드 입력] 난에 입력합니다. 4. 필요한 경우, [일치하는 단어를 선택하여 검색 범위 좁히기] 난에 단어를 입력함으로써 검색의 범위를 좁힙니다. 5. [표시할 항목 선택] 난에서 원하는 항목을 선택합니다. 해당 도움말이 도움말 창의 오른쪽에 나타납니다. 팁: 색인을 재구성하려면 [검색 / 옵션]을 선택합니다.
도움말 항목 인쇄	현재 보고 있는 도움말 항목을 인쇄하는 방법은 여러 가지가 있습니다.  [인쇄]를 누릅니다.  [파일] 메뉴에서 [항목 인쇄] 명령을 실행합니다.  도움말 창 안의 어떤 지점에서 마우스의 오른쪽 누르기를 하여 나오는 명령 가운데, [항목 인쇄]를 실행합니다. 참조: 인쇄는 개별 항목별로만 할 수 있습니다. 전체 도움말을 일괄 인쇄할 수는 없습니다.  폽업 창의 정보를 인쇄하려면, 그 안에서 마우스의 오른쪽 누르기를 하여 나오는 명령 가운데, [항목 인쇄]를 실행합니다.

팁: 이전에 본 항목을 보려면 도움말 도구 모음의 [뒤로]를 누릅니다.


비고 레코드 보고하기

 개요 및 추가 정보

Trimble Geomatics Office 프로젝트 데이터베이스로부터 비고를 보고하려면, 사용자 정의 데이터베이스 보고서를 만듭니다. 사용자 정의 보고서는 기본 레코드 종류나 데이터베이스에 정의된 질의를 토대로 합니다.

사용자 정의 보고서를 만드는 과정은 2 단계로 구성됩니다.

  선택 집합의 정의

  보고서 포맷 만들기


선택 집합 정의하기

비 그래픽 레코드 종류(예: 비고 레코드)를 선택하려면

1.	다음 중 하나를 실행합니다.

  .dc 파일 선택 집합을 이용합니다.

  [선택 / 질의 기준] 명령을 실행합니다.

2.	레코드 종류를 선택합니다.

참조: '전체 데이터베이스'를 선택하면 데이터베이스의 모든 비고가 보고서에 포함됩니다.


보고서 포맷 만들기

방법:

1.	[보고서 / 기타 보고서]를 선택합니다. [기타 보고서] 대화 상자가 나옵니다. 현재 이용 가능한 보고서 목록이 표시됩니다.

2.	새 보고서 포맷을 만들려면 [새로 만들기]를 누릅니다. [보고서 포맷 정의] 대화 상자가 나옵니다.

3.	[이름] 필드에 보고서 이름을 입력합니다.

4.	[보고서 작성 대상] 필드에서 비고 레코드를 선택합니다.

5.	[포맷 본문] 필드에서

  '[비고]'라 입력하거나

  바로 가기 메뉴를 이용하여 [비고]를 선택합니다.

기본 HTML 뷰어가 실행되면서 해당 보고서가 나옵니다. 이것은 저장하거나 인쇄할 수 있습니다.


포인트 정보와 함께 비고 레코드(현장에서 수집한) 보고하기

Trimble Geomatics Office에서 비고 레코드는 포인트와 직접적으로 연관이 되지는 않습니다. 따라서 비고 레코드와 포인트 정보(예: N, E, 비고)를 상기 과정으로써 직접 내보낼 수 없습니다. 하지만 피쳐 코드 필드를 통하면 이 비고를 내보낼 수 있습니다.

방법:

1.	해당 .dc 파일에서 DC Editor 유틸리티를 이용하여, 뒤이어 비고가 나오는 GPS 벡터 레코드(GPS VEC)를 찾습니다.

2.	이 GPS 벡터 레코드 필드에서 코드 필드로 갑니다. 현재 코드 다음에 대시 부호에 이어 비고 정보를 입력합니다. 예: TREE - Pine

이 레코드를 가져올 때, 비고 레코드가 그 피쳐 코드 필드의 마지막에 추가됩니다. 이제 비고가 어떤 포인트와 연관이 되므로 다음과 같은 보고를 할 수 있습니다.

  포인트, X 좌표, Y 좌표, 피쳐 코드

참조: 때로는 GPS 벡터 레코드 필드 다음에 타임 스탬프와 비고 레코드가 연이어 나오는 경우가 있습니다. 이 경우, 타임 스탬프는 그 포인트와 관련되는 것이 아니라 피쳐 코드와 관련되므로 삭제할 필요가 있습니다.


사용자 정의 포인트 보고서 만들기

 개요 및 추가 정보

Trimble Geomatics Office 데이터베이스로부터 포인트 레코드를 보고하려면, 사용자 정의 데이터베이스 보고서를 만듭니다. 사용자 정의 보고서는 기본 레코드 종류나 데이터베이스에 정의된 질의를 토대로 합니다.


사용자 정의 데이터베이스 보고서 만들기

1.	[보고서 / 기타 보고서]를 선택합니다. [기타 보고서] 대화 상자가 나옵니다. 현재 이용 가능한 보고서 목록이 표시됩니다.

2.	새 보고서 포맷을 만들려면 [새로 만들기]를 누릅니다. [보고서 포맷 정의] 대화 상자가 나옵니다.

3.	[이름] 필드에 보고서 이름을 입력합니다. 기본값으로, '포인트 레코드' 항목이 [보고서 작성 대상] 필드에 나옵니다.

4.	[포맷 자동 구성]을 누르면 Trimble Geomatics Office 상에서 [포맷 헤더] 필드와 [포맷 본문] 필드가 자동으로 입력됩니다. 이 포맷은 사용자가 수정할 수 있습니다.

팁: [포맷 헤더] 필드와 [포맷 본문] 필드에서 마우스의 오른쪽 누르기를 합니다. 나오는 바로 가기 메뉴에서 [필드]를 선택한 다음, 원하는 필드 코드를 선택합니다.

5.	[확인]을 누릅니다.

기본 HTML 뷰어가 실행되면서 해당 보고서가 나옵니다. 이것은 저장하거나 인쇄할 수 있습니다.


프로젝트 투영법의 존 변경하기

 개요 및 추가 정보

참조: 좌표계 데이터베이스에 존이 있어야 합니다.

1.	[파일 / 프로젝트 등록 정보] 명령을 실행합니다. [프로젝트 등록 정보] 대화 상자가 나옵니다.

2.	[좌표계] 탭을 선택합니다.

3.	[좌표계 설정] 상자에서 [변경] 단추를 누릅니다. [좌표계 선택] 대화 상자가 나옵니다.

4.	[새 좌표계] 옵션을 선택한 후, [다음] 단추를 누릅니다. [좌표계 종류 선택] 대화 상자가 나옵니다.

5.	[좌표계와 존] 옵션을 선택한 후, [다음] 단추를 누릅니다.

6.	필요한 존이 포함된 좌표계를 [좌표계 그룹] 상자에서 선택합니다.

7.	[존] 상자에서 존을 선택한 후, [다음] 단추를 누릅니다. [지오이드 모델 선택] 대화 상자가 나옵니다.

8.	선택할 수 있는 옵션:

  프로젝트에 쓸 지오이드 모델을 선택합니다.

  [지오이드 모델 불이용] 옵션을 선택합니다.

9.	[종료] 단추를 누릅니다.

데이터베이스에 이 좌표계가 적용됩니다. 데이터베이스상의 기존 포인트는 모두 새 좌표계로 변환됩니다.

프로젝트의 포인트 위치나 입력한 좌표가 공백값인 경우, 그 프로젝트 표고가 정의되어 있지 않다면 좌표계 선택이 되지 않습니다. 이는 Trimble Geomatics Office가 근사 표고 없이 기존 포인트를 한 좌표계에서 다른 좌표계로 변환할 수 없기 때문입니다.


Trimble Survey Controller 소프트웨어에 피쳐 및 속성 라이브러리 내보내기
Trimble Survey Controller에 배경 맵 파일 내보내기

 개요 및 추가 정보

1.	다음 중 하나를 실행합니다.

  [파일 / 내보내기] 명령을 실행합니다.

  [내보내기] 도구 단추를 누릅니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '피쳐 및 속성 라이브러리를 Survey Controller로 (*.fcl)' 옵션을 선택합니다. [피쳐 및 속성 라이브러리 선택] 대화 상자가 나옵니다.

3.	내보내고자 하는 .fcl 파일을 찾으려면 [찾아보기] 단추를 누릅니다.

4.	피쳐 및 속성 라이브러리에 들어 있는 속성 정의를 송출하려면 [속성 내보내기] 확인란을 선택합니다. 이 옵션을 쓰면 Trimble Survey Controller에서 속성을 이용할 수 있게 됩니다. 이 확인란을 선택하지 않을 경우에는 .fcl 파일에 정의된 속성을 내보낼 수 없습니다.

참조: 제어 코드도 송출됩니다.

5.	[확인] 단추를 누르면 Data transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

6.	Trimble Survey Controller가 실행 중인 장치가 사용자의 컴퓨터에 연결되어 있는지 확인합니다.

7.	Survey Controller 장치를 선택하고 [열기]를 누르면 [연결 중] 대화 상자가 나옵니다.

연결이 되면 저장 대화 상자가 나옵니다.

8.	옵션을 선택합니다.

  라이브러리를 Trimble Survey Controller의 주 메모리에 저장하려면 주 메모리 (C:) 옵션을 선택합니다.

  라이브러리를 PC 카드에 저장하려면(PC 카드가 삽입되어 있어야 함) PC 카드 (A:) 옵션을 선택합니다.

참조: 사용자의 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

9.	[열기]를 누릅니다. 선택한 저장 위치를 시스템이 읽고 그 디렉토리의 모든 피쳐 및 속성 라이브러리 파일을 표시합니다. 피쳐 및 속성 라이브러리의 내부 이름이 [파일 이름] 필드에 나옵니다.

10. 필요한 경우, [파일 이름] 필드를 수정하여 Trimble Survey Controller에 있는 파일의 이름을 변경합니다. 사용자의 시스템에 있는 원래 파일의 이름은 바뀌지 않습니다.

11. [저장]을 누르면 [업로드 중] 대화 상자가 나옵니다. 전송 진행도를 표시하는 막대가 나옵니다.

전송이 완료되면 [업로드 중] 대화 상자가 사라지고 그 장치와의 연결이 끊어집니다.

해당 라이브러리의 전송이 완료되었습니다.


GIS 포맷에 내보내기

 개요 및 추가 정보

1.	다음 중 하나를 실행합니다.

  [파일 / 내보내기] 명령을 실행합니다.

  표준 도구 모음의 [내보내기] 도구 단추를 누릅니다.

[내보내기] 대화 상자가 나옵니다.

2.	필요한 포맷을 [GIS] 탭 하에서 선택합니다.

3.	내보내기 포맷에 대한 설정 옵션을 변경하려면 [옵션]을 눌러, 필요한 설정 작업을 합니다.

4.	[확인]을 누릅니다. [파일 이름] 대화 상자가 나옵니다.

5.	이 새 파일의 이름을 명시하고 [저장]을 누르면 파일(들)이 새로 만들어집니다.


결합 데이텀 그리드 (.cdg) 파일을 만들어 Trimble Survey Controller에 전송하기

 개요 및 추가 정보

참조: 새 결합 데이텀 그리드는 프로젝트에서 현재 사용 중인 데이텀 그리드 파일을 이용하여서만 만들 수 있습니다. 그러나 결합 데이텀 그리드는 어떤 것이든 내보낼 수 있습니다. 또한 Trimble Survey Controller 버전 7.00 이상에만 결합 데이텀 그리드 파일을 전송할 수 있습니다.

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '데이텀 그리드를 Survey Controller로 (*.cdg)' 옵션을 선택하고 [확인]을 누릅니다. [데이텀 그리드 내보내기] 대화 상자가 나옵니다.

3.	'Survey Controller로 내보낼 결합 데이텀 그리드 파일 만들기' 옵션을 선택합니다. [결합 데이텀 그리드 만들기] 대화 상자가 나옵니다.

지구체의 노란 네모 상자가 해당 위도/경도 그리드 파일이 포괄할 영역의 범위를 지정합니다. 그 내용은 [결합 데이텀 그리드 만들기] 대화 상자의 오른쪽에 나타납니다.

4.	파일의 크기를 줄이려면 [결합 데이텀 그리드 만들기] 대화 상자의 왼쪽 상단에 있는 선택 도구 단추를 이용합니다. 노란 네모 상자 안의 영역으로 검정 선택 상자를 드래그함으로써, 결합 데이텀 그리드를 만들고자 하는 영역을 지정합니다.

[파일 크기]는 그 파일의 크기를 표시하고, [위도 범위]와 [경도 범위]는 만들 결합 데이텀 그리드 파일의 범위를 표시합니다.

5.	[Survey Controller 이름] 필드에는 Trimble Survey Controller 작업에서 쓸 결합 데이텀 그리드(서브 그리드된)의 이름이 표시됩니다. 같은 이름의 데이텀 그리드를 이미 그 Trimble Survey Controller에서 쓰고 있다면 이 이름에 접두어나 접미어를 붙이도록 합니다. 원래 데이텀 그리드의 이름은 반드시 포함되어야 합니다.

참조: Survey Controller (*.dc) 파일의 가져오기 도중, Trimble Geomatics Office는 그 Survey Controller 이름을 이용하여 이 필드의 .cdg 파일 이름이 Trimble Geomatics Office 프로젝트에 정의된 데이텀 그리드와 일치하는지 확인합니다. 만일 이 이름이 원래의 데이텀 그리드 이름을 포함하지 않는다면 해당 데이텀 그리드는 인식이 되지 못합니다.

6.	[확인]을 누릅니다.

[파일 이름] 대화 상자가 나옵니다. 기본값으로 쓰이는 파일 이름은 해당 데이텀 그리드 이름의 처음 6 문자입니다. 이것은 Trimble Survey Controller에서 쓰이는 이름이 아니라 Program Files\Common Files\Trimble\GeoData 디렉토리에 저장될 .cdg 파일의 이름입니다.

7.	다른 이름을 입력하려면 키보드로 [파일 이름] 필드를 수정한 후, [저장]을 누릅니다. Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

8.	어떤 Survey Controller 장치를 선택하고 [열기]를 누릅니다. [연결 중] 대화 상자가 나옵니다. 연결이 되면 저장 대화 상자가 나옵니다.

9.	옵션을 선택합니다.

  라이브러리를 Trimble Survey Controller의 주 메모리에 저장하려면 주 메모리 (C:) 옵션을 선택합니다.

  라이브러리를 PC 카드에 저장하려면(PC 카드가 삽입되어 있어야 함) PC 카드 (A:) 옵션을 선택합니다.

참조: 사용자의 Trimble 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

10. [열기]를 누릅니다.

선택한 저장 위치를 시스템이 읽고 그 디렉토리의 모든 결합 데이텀 그리드 파일을 표시합니다. [파일 이름] 필드는 활성화되지 않습니다. 그 Trimble Survey Controller에 나오는 결합 데이텀 그리드의 이름이 표시됩니다.

11. [저장]을 누르면 [업로드 중] 대화 상자가 나옵니다. 전송 진행도를 표시하는 막대가 나옵니다. 전송이 완료되면 [업로드 중] 대화 상자가 사라지고 그 데이터 컬렉터와의 연결이 끊어집니다.

이제 Trimble Survey Controller에서 이 파일을 이용할 수 있습니다.


지오이드 그리드(.ggf) 파일을 서브 그리드하여 Trimble Survey Controller 소프트웨어에 전송하기
지오이드 그리드(.ggf) 파일을 서브 그리드하여 Trimble Survey Controller에 전송하기

 개요 및 추가 정보

참조: Trimble Survey Controller 버전 6.00 이상에만 지오이드 그리드 파일을 전송할 수 있습니다.

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '지오이드 파일을 Survey Controller로 (*.ggf)' 옵션을 선택하고 [확인]을 누릅니다. [지오이드 모델 내보내기] 대화 상자가 나옵니다.

3.	새 지오이드 그리드 파일을 만들려면 '지오이드 모델의 서브 그리드를 만들어 Survey Controller로 내보내기' 옵션을 선택하고 [확인]을 누릅니다. [지오이드 그리드 파일 만들기] 대화 상자가 나옵니다.

참조: 이 형식의 기존 파일을 내보내려면 '기존 지오이드 모델을 Survey Controller로 내보내기' 옵션을 선택합니다.

지구체의 노란 네모 상자가 해당 지오이드 모델이 포괄할 영역의 범위를 지정합니다. 그 지오이드 모델과 지오이드 그리드 파일은 [지오이드 그리드 파일 만들기] 대화 상자의 오른쪽에 나타납니다. 그 지오이드 모델이 전세계를 포함하는 경우에는 노란 네모 상자가 보이지 않게 됩니다.

4.	파일의 크기를 줄이려면 [지오이드 그리드 파일 만들기] 대화 상자의 왼쪽 상단에 있는 선택 도구 단추를 이용합니다. 노란 네모 상자 안의 영역으로 검정 선택 상자를 드래그함으로써, 지오이드 그리드 파일을 만들고자 하는 영역을 지정합니다.

[파일 크기]는 그 파일의 크기를 표시하고, [위도 범위]와 [경도 범위]는 만들 지오이드 그리드 파일의 범위를 표시합니다.

5.	[이름] 필드에는 Trimble Survey Controller 작업에서 쓸 지오이드 모델(서브 그리드된)의 이름이 표시됩니다. 같은 이름의 지오이드 모델을 이미 그 Survey Controller에서 쓰고 있다면 이 이름에 접두어나 접미어를 붙이도록 합니다. 원래 지오이드 모델의 이름은 반드시 포함되어야 합니다.

참조: Survey Controller (*.dc) 파일의 가져오기 도중, Trimble Geomatics Office는 [이름] 필드를 이용하여 이 필드의 .ggf 파일 이름이 Trimble Geomatics Office 프로젝트에 정의된 지오이드 모델과 일치하는지 확인합니다. 파일 이름에 원래의 지오이드 모델 이름이 꼭 포함되도록 합니다. 그렇지 않으면 해당 지오이드 모델이 인식되지 못합니다.

6.	[확인]을 누릅니다.

[다른 이름으로 저장] 대화 상자가 나옵니다. 기본값으로 쓰이는 파일 이름은 해당 지오이드 모델 이름의 처음 6 문자입니다. 이것은 Program Files\Common Files\Trimble\GeoData 디렉토리에 저장될 지오이드 그리드 파일의 이름입니다.

7.	다른 이름을 입력하려면 키보드로 [파일 이름] 필드를 수정한 후, [저장]을 누릅니다. Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

8.	어떤 Survey Controller 장치를 선택하고 [열기]를 누릅니다. [연결 중] 대화 상자가 나옵니다. 연결이 되면 저장 대화 상자가 나옵니다.

9.	옵션을 선택합니다.

  파일을 Trimble Survey Controller의 주 메모리에 저장하려면 주 메모리 (C:) 옵션을 선택합니다.

  파일을 PC 카드에 저장하려면(PC 카드가 삽입되어 있어야 함) PC 카드 (A:) 옵션을 선택합니다.

참조: 사용자의 Trimble 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

10. [열기]를 누릅니다.

선택한 저장 위치를 시스템이 읽고 그 디렉토리의 지오이드 그리드 파일을 모두 표시합니다. [파일 이름] 필드에는 Survey Controller에 나오는 지오이드 그리드의 이름이 표시됩니다. 이 이름은 Trimble Geomatics Office에 .dc 파일을 전송할 경우, 그 지오이드 그리드 이름과의 비교, 확인에 이용합니다.

11. [저장]을 누르면 [보내는 중] 대화 상자가 나옵니다. 전송 진행도를 표시하는 막대가 나옵니다. 전송이 완료되면 [보내는 중] 대화 상자가 사라지고 그 장치와의 연결이 끊어집니다.

이제 Trimble Survey Controller에서 이 파일을 이용할 수 있습니다.

참조: Grid Factory 유틸리티를 이용하여서도 지오이드 모델 파일을 서브 그리드할 수 있습니다. Grid Factory는 Trimble Geomatics Office 소프트웨어의 설치시 사용자가 옵션으로 설치할 수 있는 유틸리티입니다.

참조: Trimble Survey Controller 버전 7.60과 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


지오이드 그리드 파일(.ggf)을 서브 그리드하여 TDS Survey Pro CE 소프트웨어에 전송하기

 개요 및 추가 정보

참조: TDS Survey Pro CE 소프트웨어 버전 4 이상에만 지오이드 그리드 파일을 전송할 수 있습니다.

1.	[파일 / 내보내기]를 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '지오이드 파일을 TDS Survey Pro CE로 (*.ggf)' 옵션을 선택하고 [확인]을 클릭합니다. [지오이드 모델 내보내기] 대화 상자가 나옵니다.

3.	새 지오이드 그리드 파일을 만들려면 '지오이드 모델의 서브 그리드를 만들어 내보내기 ' 옵션을 선택하고 [확인]을 클릭합니다. [지오이드 그리드 파일 만들기] 대화 상자가 나옵니다.

참조: 이 형식의 기존 파일을 내보내려면 '기존 지오이드 그리드 파일 내보내기' 옵션을 선택합니다.

지구체의 노란 네모 상자가 해당 지오이드 모델이 포괄할 영역의 범위를 지정합니다. 그 지오이드 모델과 지오이드 그리드 파일은 [지오이드 그리드 파일 만들기] 대화 상자의 오른쪽에 나타납니다. 그 지오이드 모델이 전세계를 포함하는 경우에는 노란 네모 상자가 보이지 않게 됩니다.

4.	파일의 크기를 줄이려면 [지오이드 그리드 파일 만들기] 대화 상자의 왼쪽 상단에 있는 선택 도구 단추를 이용합니다. 노란 네모 상자 안의 영역으로 검정 선택 상자를 드래그함으로써, 지오이드 그리드 파일을 만들고자 하는 영역을 지정합니다.

[파일 크기]는 그 파일의 크기를 표시하고, [위도 범위]와 [경도 범위]는 만들 지오이드 그리드 파일의 범위를 표시합니다.

5.	[이름] 필드에는 쓸 지오이드 모델(서브 그리드된)의 이름이 표시됩니다.

참조: 파일 가져오기 도중, Trimble Geomatics Office는 [이름] 필드를 이용하여 이 필드의 .ggf 파일 이름이 Trimble Geomatics Office 프로젝트에 정의된 지오이드 모델과 일치하는지 확인합니다. 파일 이름에 원래의 지오이드 모델 이름이 꼭 포함되도록 합니다. 그렇지 않으면 해당 지오이드 모델이 인식되지 못합니다.

6.	[확인]을 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다. 기본값으로 쓰이는 파일 이름은 해당 지오이드 모델 이름의 처음 6 문자입니다. 이것은 Program Files\Common Files\Trimble\GeoData 디렉토리에 저장될 지오이드 그리드 파일의 이름입니다.

7.	다른 이름을 입력하려면 키보드로 [파일 이름] 필드를 수정한 후, [저장]을 누릅니다. Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

8.	TDS Survey Pro CE 장치를 선택하고 [열기]를 누릅니다. [연결 중] 대화 상자가 나옵니다. 연결이 되면 저장 대화 상자가 나옵니다.

9.	이 파일을 TDS Survey Pro CE 장치로 전송합니다.

이제 TDS Survey Pro CE 소프트웨어에서 이 파일을 이용할 수 있습니다.

참조: Grid Factory 유틸리티를 이용하여서도 지오이드 모델 파일을 서브 그리드할 수 있습니다. Grid Factory는 Trimble Geomatics Office 소프트웨어의 설치시 사용자가 옵션으로 설치할 수 있는 유틸리티입니다.


TRIMMAP 소프트웨어의 데이터 이용하기

TRIMMAP 소프트웨어로써 만든 작업으로부터 Trimble Geomatics Office로 데이터를 가져올 수 있습니다.

1.	Trimble Geomatics Office로써 처리하고자 하는 작업을 TRIMMAP 소프트웨어에서 불러옵니다.

2.	[도구 / 가져오기 /내보내기 / 그래픽 인터페이스]를 선택합니다. [그래픽 인터페이스] 메뉴가 나옵니다.

3.	[그래픽 인터페이스 / 파일 만들기] 명령을 실행합니다.

4.	작업 이름과 출력 파일 이름을 입력합니다.

참조: [출력 파일 이름] 필드에는 만들 파일의 이름과 위치, 확장자 .tgf 를 명시하도록 합니다. 예: C:\Temp\Topo_pts.tgf

5.	Trimble Geomatics Office에서 [파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

6.	[CAD / ASCII] 탭 하에서 'TRIMMAP 그래픽 파일' 옵션을 선택하고 [확인]을 누릅니다. [파일 선택] 대화 상자가 나옵니다.

7.	.tgf 파일이 들어 있는 폴더를 찾아가서 [열기]를 누릅니다.

해당 파일이 Trimble Geomatics Office로 도입됩니다.


새 질의 만들기

경고: 이 데이터베이스는 Trimble사의 Trimble Geomatics Office 소프트웨어로써만 사용하고 수정하도록 합니다. Trimble 사는 이 데이터베이스를 기타 다른 소프트웨어로써 이용하거나 수정하는 것을 승인하지 않으며, 그 결과를 보증하지도 않습니다. Trimble사는 언제라도 이 데이터베이스의 포맷을 변경함으로써 다른 소프트웨어와 호환이 되지 않게 할 수도 있습니다.

 개요 및 추가 정보

참조: 사용자 정의 질의를 만들려면 Microsoft Access 2000 (또는 그 이상) 소프트웨어가 필요합니다.

표고값이 0인 데이터베이스 포인트를 모두 선택하는 질의(query)를 만들어 봅시다.

1.	Microsoft Access에서 Trimble Geomatics Office의 템플리트/프로젝트 데이터베이스(질의를 추가해 넣고자 하는)를 불러옵니다. 이것(.mdb)은 그 템플리트나 프로젝트의 폴더에 있습니다.

2.	메인 그래픽 창에서 [쿼리] 탭을 선택한 다음, [새로 만들기]를 누릅니다.

팁: [쿼리 마법사] 옵션보다는 [디자인 보기] 옵션을 선택합니다.

3.	[테이블 표시] 대화 상자에서 포인트 테이블을 선택합니다. 이는 포인트 개체를 선택하고자 하고, 또 이들이 모두 포인트 테이블에 저장되기 때문입니다.

4.	대화 상자를 닫기 전에 [추가]를 누릅니다.

쿼리 대화 상자가 나옵니다.

5.	질의 정의의 첫째 열을 전체 포인트 테이블로 설정합니다. 이것은 질의 대화 상자의 상단 섹션에 있는 포인트 테이블로부터 * 식별자를 끌어다 놓거나, 아니면 [필드] 상자로부터 Point.*을 선택함으로써 설정할 수 있습니다.

참조: 기본값으로 [표시] 확인란이 선택됩니다. 이 질의로 여러 종류의 개체를 선택하는 것이 아니라면 전체 테이블을 리턴하도록 합니다. 그래야만 질의를 다른 용도(보고 작업 등)에 이용할 수 있습니다.

6.	두번 째 열의 [필드]를 '표고'(표고 필드 식별자)로 설정합니다.

이 열의 [조건] 필드에 0을 입력합니다. 이것은 0의 표고 값에 대한 확인 설정입니다.

7.	이 질의의 결과를 보려면 데이터시트 보기를 체크합니다. 데이터베이스의 포인트 중 높이가 0인 것은 모두 테이블에 나열됩니다.

8.	새 질의를 저장하려면, 이것을 닫고 접두어 밪elect_�를 이름 앞에 붙입니다. 예: 밪elect_Points with zero elevations�.

참조: 질의를 등록 정보 창의 선택 도구에 추가하려면, [정렬] 도구에는 접두어 밪ortSS_�, [필터] 도구(측량 데이터)에는 접두어 밪vyFilterSS_�, [필터] 도구(CAD 데이터)에는 접두어 밣lanFilterSS_�를 각각 이용합니다. 질의를 사용자 정의 보고서에 이용하려면 접두어 밨eport_�를 씁니다.

9.	새 질의는 데이터베이스 스키마 파일을 업데이트하기 전에는 [선택 / 질의 기준] 명령 하에서 뿐만 아니라, Trimble Geomatics Office의 어디에서도 이용할 수 없습니다. Microsoft Windows 탐색기를 이용하여 프로젝트(또는 템플리트 프로젝트)의 기존 데이터베이스 스키마 파일(.dbs)을 삭제하도록 합니다.

참조: 데이터베이스 스키마 파일이 없는 프로젝트를 불러올 때, Trimble Geomatics Office는 데이터베이스 파일의 설정을 토대로 해서 자동으로 새 스키마 파일을 만듭니다. 이 새 스키마 파일은 새로 추가되는 질의에 참조됩니다. 새 질의는 [선택 / 질의 기준] 명령에서 나오는데, 사용자 정의 ASCII 내보내기와 보고서 정의에 이용할 수 있습니다.

10. Trimble Geomatics Office를 실행한 다음, 해당 질의를 추가한 템플리트나 프로젝트를 불러옵니다.

이제 [선택 / 질의 기준] 명령을 선택함으로써 이 새 질의를 이용할 수 있습니다. 새 질의가 목록에 나옵니다.


Trimble Survey Controller 소프트웨어로부터 Survey Controller (*.dc) 파일 가져오기
Trimble Survey Controller로부터 Survey Controller (*.dc) 파일 가져오기

 개요 및 추가 정보

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 측량 장치 옵션을 선택하고 [확인]을 누릅니다. Data Transfer의 [열기] 대화 상자가 나옵니다.

3.	Survey Controller 장치를 선택하고 [열기]를 누르면 [연결 중] 대화 상자가 나옵니다.

연결이 되면 [열기] 대화 상자의 [위치] 필드가 'Survey Controller 장치'로 설정됩니다.

4.	옵션을 선택합니다.

  가져오는 파일이 Trimble Survey Controller의 주 메모리에 있다면 주 메모리 (C:) 옵션을 선택합니다.

  PC 카드에 있는(PC 카드가 삽입되어 있어야 함) 파일을 가져오고자 하면 PC 카드 (A:) 옵션을 선택합니다.

참조: 사용자의 Trimble 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

5.	[열기]를 누릅니다. 선택한 디렉토리에 있는 Trimble Survey Controller 작업이 모두 표시됩니다.

6.	[파일 포맷] 필드에서 사용자의 데이터 컬렉터 파일 버전을 선택합니다.

7.	가져오고자 하는 파일(들)을 선택하고 [열기]를 누릅니다. 파일 전송의 진행도 표시 막대가 있는 [다운로드 중] 대화 상자가 나옵니다. 전송이 완료되면 이 대화 상자가 사라지고 장치와의 연결이 끊어집니다.

해당 작업 파일이 .dc 파일로 변환되었다가 프로젝트 데이터베이스로 도입됩니다. 이 .dc 파일은 프로젝트의 Data Files\Trimble Files 폴더에 저장됩니다.

참조: .dc 파일은 Trimble Survey Controller가 실행 중인 장치로부터 Trimble Geomatics Office에 전송할 경우, 프로젝트로 자동 도입됩니다.

참조: Trimble Survey Controller 버전 7.60와 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


사용자의 컴퓨터상에서 Trimble GPS 데이터 (.dat) 파일 가져오기

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 'GPS 데이터 (*.dat) 파일' 옵션을 선택하고 [확인]을 누릅니다. [열기] 대화 상자가 나옵니다.

3.	가져오고자 하는 .dat 파일을 찾은 다음, [열기]를 누릅니다. [DAT 체크인] 대화 상자가 나옵니다.

4.	필요한 변경을 합니다.

안테나 높이값이 올바른지 꼭 확인합니다. 어떤 값을 변경한다 하더라도 해당 .dat 파일의 실제 값은 바뀌지 않습니다. 하지만 이 새 값이 Trimble Geomatics Office에서 쓰이게 됩니다. 따라서 해당 .dat 파일은 원래 상태대로 유지됩니다.

5.	[확인]을 누릅니다.

이 파일은 프로젝트의 Data Files\Trimble Files 폴더에 저장됩니다.

팁: 끌어다 놓기 기능을 이용하여 파일을 가져올 수도 있습니다.


Trimble GPS 수신기로부터 Trimble GPS 데이터 (.dat) 파일 가져오기

 개요 및 추가 정보

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 측량 장치 옵션을 선택하고 [확인]을 누릅니다. Data Transfer의 [열기] 대화 상자가 나옵니다.

3.	GPS 수신기 장치를 선택하고 [열기]를 누르면 [연결 중] 대화 상자가 나옵니다.

연결이 되면 [열기] 대화 상자의 [위치] 필드가 'GPS 수신기 장치'로 설정됩니다.

4.	가져오고자 하는 파일(들)을 선택하고 [열기]를 누릅니다. 파일 전송의 진행도 표시 막대가 있는 [다운로드 중] 대화 상자가 나옵니다.

전송이 완료되면 이 대화 상자가 사라지고 GPS 수신기와의 연결이 끊어집니다.

[DAT 체크인] 대화 상자가 나옵니다.

5.	필요한 변경을 합니다.

안테나 높이 값이 올바른지 꼭 확인합니다. 어떤 값을 변경한다 하더라도 해당 .dat 파일의 실제 값은 바뀌지 않습니다. 하지만 이 새 값이 Trimble Geomatics Office에서 쓰이게 됩니다. 따라서 해당 .dat 파일은 원래 상태대로 유지됩니다.

6.	[확인]을 누릅니다.

이 파일은 프로젝트의 Data Files\Trimble Files 폴더에 저장됩니다


RINEX GPS 데이터 파일 가져오기

 개요 및 추가 정보

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 'RINEX 파일' 옵션을 선택하고 [확인]을 누릅니다. [열기] 대화 상자가 나옵니다.

3.	가져오고자 하는 관측치 파일(들)을 선택합니다. 필요한 경우, [파일 형식] 옵션을 변경하고 [열기]를 누릅니다.

대응하는 .nav 파일이 이름이 같으면 그 관측치 파일과 자동으로 연계됩니다.

대응하는 .nav 파일이 이름이 같지 않으면 [항법 파일 부합 검사] 대화 상자가 나옵니다. 적합한 .nav 파일을 선택하고 [확인]을 누릅니다.

참조: 각 관측치 파일은 대응하는 .nav 파일이 있어야 합니다. 올바른 .nav 파일이 선택되지 않으면 가져오기시 오류 메시지가 나오게 되며 기선이 처리되지 못합니다.

4.	파일이 Trimble GPS 데이터 파일 포맷으로 변환됩니다. [DAT 체크인] 대화 상자가 나옵니다.

5.	필요한 변경을 합니다.

안테나 높이 값과 수신기 종류가 올바른지 꼭 확인합니다. 어떤 값을 변경한다 하더라도 해당 GPS 데이터 파일의 실제 값은 바뀌지 않습니다. 하지만 이 새 값이 Trimble Geomatics Office에서 쓰이게 됩니다. 따라서 해당 GPS 데이터 파일은 원래 상태대로 유지됩니다.

팁: DAT 체크인에서 수신기와 안테나 종류가 알 수 없음으로 되어 있지 않은지 확인합니다.

6.	[확인]을 누릅니다.

이 파일은 프로젝트의 Data Files\Trimble Files 폴더에 저장됩니다


사용자 정의의 가져오기/내보내기 포맷 만들기

 개요 및 추가 정보

사용자 정의의 내보내기 포맷을 만드는 예시입니다. 이 포맷은 포인트 이름(대문자)과 X 좌표(단위 있는), Y 좌표(단위 있는), 표고(단위 있는)가 들어 있는 콤마 구분형 텍스트 파일입니다. 또한 필드를 선택하기 위한 필드 코드를 사용합니다. 사용자 정의의 가져오기 포맷도 이와 비슷한 방식으로 만듭니다.

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[사용자] 탭 하에서 [새 포맷]을 누릅니다. [ASCII 내보내기 포맷 정의] 대화 상자가 나옵니다.

3.	[이름] 필드에 이름을 입력합니다.

4.	[포맷 본문] 필드에서 마우스의 오른쪽 누르기를 합니다. 나오는 바로 가기 메뉴의 [필드 / 이름]을 선택합니다.

'[이름]'이 포맷 본문 상자에 나옵니다.

5.	마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 대문자]를 선택합니다.

'[이름:대문자]'가 포맷 본문 상자에 나옵니다. 이것은 포인트 이름을 모두 대문자로 내보낸다는 것을 의미합니다.

6.	콤마에 이어 스페이스를 입력합니다.

7.	마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / X 좌표]를 선택합니다.

'[X 좌표]'가 콤마 옆에 나옵니다.

8.	마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 단위]를 선택합니다.

'[X 좌표]'가 '[X 좌표:단위]'로 바뀝니다. 이것은 현행 좌표 단위가 파일에 포함된다는 것을 의미합니다.

9.	콤마에 이어 스페이스를 입력합니다.

10. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / Y 좌표]를 선택합니다.

'[Y 좌표]'가 콤마 옆에 나옵니다.

11. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 단위]를 선택합니다.

'[Y 좌표]'가 '[Y 좌표:단위]'로 바뀝니다. 이것은 현행 좌표 단위가 파일에 포함된다는 것을 의미합니다.

12. 콤마에 이어 스페이스를 입력합니다.

13. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 표고]를 선택합니다.

'[표고]'가 콤마 옆에 나옵니다.

14. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 단위]를 선택합니다.

'[표고]'가 '[표고:단위]'로 바뀝니다. 이것은 현행 좌표 단위가 파일에 포함된다는 것을 의미합니다.

15. [확인]을 눌러 이 내보내기 포맷을 저장합니다. [내보내기] 대화 상자가 나옵니다. 만든 포맷이 [사용자] 탭 하의 목록에 나옵니다.

16. 데이터를 이 포맷으로 내보내려면, 이것을 선택하고 [확인]을 누릅니다. [다른 이름으로 저장] 대화 상자가 나옵니다.

17. [파일 이름] 필드에 어떤 이름을 입력하고 [저장]을 눌러 파일을 만듭니다.


Trimble Survey Controller 소프트웨어에 Survey Controller (*.dc) 파일 내보내기
Trimble Survey Controller에 Survey Controller (*.dc) 파일 내보내기

 개요 및 추가 정보

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 측량 장치 옵션을 선택합니다.

3.	[옵션]을 눌러 그 파일에 대한 작업 설정을 명시합니다.

4.	나오는 대화 상자에서 [확인]을 눌러 변경 내용을 저장하고 [내보내기] 대화 상자로 돌아갑니다.

5.	[확인]을 누르면 Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

6.	Trimble Survey Controller 장치를 선택하고 [열기]를 누릅니다. [연결 중] 대화 상자가 나옵니다.

7.	연결이 되면 저장 대화 상자가 나옵니다.

8.	옵션을 선택합니다.

  파일을 Trimble Survey Controller의 주 메모리에 저장하려면 주 메모리 (C:) 옵션을 선택합니다.

  파일을 PC 카드에 저장하려면(PC 카드가 삽입되어 있어야 함) PC 카드 (A:) 옵션을 선택합니다.

참조: 사용자의 Trimble 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

9.	[열기]를 누릅니다.

선택한 저장 위치를 시스템이 읽고 그 폴더의 Survey Controller 파일을 모두 표시합니다. [파일 이름] 필드에 Trimble Geomatics Office 프로젝트 이름이 나옵니다. 이것은 Trimble Survey Controller에 내보낼 Trimble Survey Controller 작업의 이름입니다. 필요한 경우, 이 이름을 변경할 수 있습니다.

10. [저장]을 누르면 [업로드 중] 대화 상자가 나옵니다. 전송의 진행도를 표시하는 막대가 나옵니다. 전송이 완료되면 [업로드 중] 대화 상자가 사라지고 그 장치와의 연결이 끊어집니다.

이제 Trimble Survey Controller에서 이 파일을 이용할 수 있습니다

참조: Trimble Survey Controller 버전 7.60과 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


AutoCAD (*.dxf) 파일 내보내기

 개요 및 추가 정보

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[CAD / ASCII] 탭 하에서 'AutoCAD (*.dxf)' 옵션을 선택합니다.

3.	내보내고자 하는 .dxf 버전과 형식을 설정하려면 [옵션]을 누릅니다.

4.	[확인]을 누르면 [다른 이름으로 저장] 대화 상자가 나옵니다.

5.	이 파일을 저장하고자 하는 폴더로 찾아갑니다.

6.	파일 이름을 입력하고 [저장]을 누릅니다.

해당 파일이 만들어집니다.

기본값으로, Trimble Geomatics Office는 포인트 이름을 포인트의 속성으로서 내보냅니다. 포인트에 대한 기타 정보를 내보내려면, Options.ini 파일에서 DXF/DWG 속성 블럭 정의를 편집합니다.

참조: 위의 절차를 이용하여 Drawing (*.dwg) 파일을 내보낼 수 있습니다. 제 3 단계에서 옵션을 눌러 .dwg 포맷과 버전을 설정합니다.


프로젝트의 단위 변경하기

 개요 및 추가 정보

1.	[파일 / 프로젝트 등록 정보] 명령을 실행합니다. [프로젝트 등록 정보] 대화 상자가 나옵니다.

2.	[단위와 포맷] 탭을 누릅니다. 그 단위와 포맷을 변경하고자 하는 필드를 선택합니다.

3.	필요한 옵션을 목록에서 선택하고, [확인]을 눌러 변경 내용을 적용합니다.


속성 이용을 위한 프로젝트 구성하기

 개요 및 추가 정보

1.	[파일 / 프로젝트 등록 정보] 명령을 실행합니다. [프로젝트 등록 정보] 대화 상자가 나옵니다.

2.	[피쳐] 탭 하에서 [속성 이용] 확인란을 선택합니다. [라이브러리] 필드가 활성화됩니다.

3.	[찾아보기]를 눌러, 필요한 피쳐 및 속성 라이브러리 (*.fcl) 파일이나 데이터 딕셔너리 (*.ddf) 파일을 찾습니다.

4.	[확인]을 누릅니다. 속성이 있는 각 피쳐 코드에 대한 데이터베이스 테이블을 만듬에 있어 이 선택 파일이 이용됩니다. 이제 속성이 있는 해당 .dc 파일을 가져올 수 있습니다.


저장된 사이트를 프로젝트 좌표계로서 선택하기

 개요 및 추가 정보

1.	[파일 / 프로젝트 등록 정보] 명령을 실행합니다. [프로젝트 등록 정보] 대화 상자가 나옵니다.

2.	[좌표계] 탭을 선택합니다.

3.	[좌표계 설정] 상자에서 [변경] 단추를 누릅니다. [좌표계 선택] 대화 상자가 나옵니다.

4.	[새 좌표계] 옵션을 선택하고 [다음] 단추를 누릅니다. [좌표계 종류 선택] 대화 상자가 나옵니다.

5.	[캘리브레이션된 사이트] 옵션을 선택하고 [다음] 단추를 누릅니다. [캘리브레이션된 사이트 선택] 대화 상자가 나옵니다.

6.	원하는 사이트를 선택하고 [종료] 단추를 누릅니다.

이 좌표계가 데이터베이스에 적용됩니다. 데이터베이스상의 기존 포인트는 모두 새 좌표계로 변환됩니다. 이 변환 과정에 대한 자세한 내용은 좌표계 − 개요 항목을 참조하십시오.

프로젝트의 포인트 위치나 입력한 좌표가 공백값인 경우, 그 프로젝트 표고가 정의되어 있지 않다면 좌표계 선택이 되지 않습니다. 이는 Trimble Geomatics Office가 기본값 표고 없이 기존 포인트를 한 좌표계에서 다른 좌표계로 변환할 수 없기 때문입니다.


속성 내보내기

 개요 및 추가 정보

다음이 포함된 파일을 내보낼 수 있습니다.

  특정 피쳐가 있는 모든 포인트

  모든 속성

각 피쳐에 대한 별도의 파일을 내보내고자 하면 다음 중 한 방법을 이용합니다.

1.	원하는 피쳐가 있는 포인트를 선택합니다.

2.	사용자 정의의 내보내기 포맷을 설정합니다.


원하는 피쳐가 있는 포인트 선택하기

방법:

1.	'평면도 보기' 모드에서 [선택 / 포인트 피쳐 기준] 명령을 실행합니다. 예를 들어, 모든 나무 속성에 대한 보고서를 만들고자 하면 [포인트 피쳐 기준 선택] 대화 상자에서 '나무'를 선택합니다.

2.	[확인]을 누릅니다. 지정한 피쳐 코드의 포인트가 모두 선택됩니다.


사용자 정의 보고서 포맷 설정하기

방법:

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[사용자] 탭 하에서 [새 포맷]을 누릅니다. [ASCII 내보내기 포맷 정의] 대화 상자가 나옵니다.

3.	[이름] 필드에 그 포맷의 이름을 입력합니다.

4.	[설명] 필드에 그 포맷에 대한 설명을 입력합니다. 이것은 포맷 설정의 필수 요건은 아닙니다.

5.	[내보낼 대상] 필드에 '포인트 정보'가 선택되도록 합니다. 이는 포인트에 관한 보고를 하고 있기 때문입니다.

6.	[포맷 자동 구성]을 누르면 포인트 테이블에서부터 포맷 헤더나 포맷 본문에 이르기까지 모든 필드가 자동으로 채워집니다.

7.	[포맷 삽입] 대화 상자에서에서 그 포맷에 필요한 적절한 구분자를 선택합니다.

8.	포맷에 포함시키고 싶지 않은 표제나 필드는 삭제합니다.

9.	포맷에 포함시키고자 하는 속성 표제를 [포맷 헤더] 상자에서 추가합니다.

10. 속성 레코드는 포인트 테이블에 저장되지 않습니다. 포맷에 포함시킬 필드를 적절한 피쳐 테이블로부터 추가합니다. 이 필드들은 [포맷 본문] 상자에서 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 선택합니다.

11. [필드 / 고급 / 속성]을 선택하면 속성('속성 이용을 위한 프로젝트 구성'에 쓰이는 피쳐 및 속성 라이브러리의)이 있는 피쳐 코드가 모두 나옵니다.

12. 원하는 피쳐 코드(이 예시에서는 '나무')를 선택하면 해당 속성들이 그 하위 메뉴에 나옵니다.

13. 보고서를 작성할 대상 속성을 선택합니다. 선택한 속성이 [포맷 본문] 상자에 나옵니다.

참조: 특정 피쳐에 대한 속성을 전부 보고하고자 하면 바로 가기 메뉴에서 별표(*) 옵션을 선택합니다. 해당 속성의 전부가 포맷 본문에 추가됩니다.

14. 파일에 내보내고자 하는 각 속성에 대하여 상기 절차를 반복합니다.

15. 포맷 설정이 완료되면 [확인]을 누릅니다. 이 포맷이 [사용자] 탭 하의 목록에 추가됩니다.

16. 파일을 이 포맷 형식으로 내보내고자 하면 이것을 선택한 후, [확인]을 누릅니다.


모든 속성이 있는 단일 파일 내보내기

방법:

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[GIS] 탭 하에서 '이름, 위도, 경도, 타원체고, 모든 속성 (로컬)' 옵션이나 '이름, N, E, 타원체고, 모든 속성' 옵션을 선택합니다.

3.	[확인]을 누릅니다.

4.	저장 대화 상자가 나옵니다. 파일 이름과 위치를 입력하고 [확인]을 누릅니다.

속성이 들어 있는 파일이 만들어집니다.


속성이 있는 Survey Controller (*.dc) 파일 가져오기

 개요 및 추가 정보

참조: Trimble Geomatics Office에서 속성을 이용하기 위해서는 반드시  먼저 속성 이용을 위한 프로젝트 구성을 하여야 합니다.

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 'Survey Controller 파일 (*.dc)' 옵션을 선택하고 [확인]을 누릅니다.

Trimble Geomatics Office는 Trimble Geomatics Office 프로젝트에 지정된 피쳐 및 속성 라이브러리 (*.fcl) 파일이나 데이터 딕셔너리 (*.ddf) 파일이 .dc 파일의 그것과 동일한지 확인합니다.

양자가 다를 경우의 처리 옵션:

  가져오기를 취소합니다.

  포인트는 모두 가져오되 속성 정보는 현재의 Trimble Geomatics Office 프로젝트가 인식하는 것만 가져옵니다. 데이터가 유실될지 모른다는 메시지가 나옵니다. 어떤 속성 정보가 도입되지 않았는지는 가져오기 보고서를 보면 알 수 있습니다.

  포인트만 가져옵니다. (속성 정보는 가져오지 않음)

그 피쳐 및 속성 라이브러리가 현재의 Trimble Geomatics Office 프로젝트에 정의되어 있지 않다면, 속성 정보 없이 .dc 파일을 가져오거나, 아니면 가져오기를 취소할 수 있습니다.

참조: Trimble Survey Controller 버전 7.60과 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


레이어 추가하기

 개요 및 추가 정보

1.	'평면도 보기' 모드에서 다음 중 한 방법을 택합니다.

  [편집 / 레이어] 명령을 실행합니다.

  [레이어 편집] 도구 단추를 누릅니다.

[레이어] 대화 상자가 나옵니다.

2.	[새로 만들기]를 누릅니다. [레이어] 대화 상자에 새 행이 생깁니다.

3.	[이름] 필드에 새 레이어의 이름을 입력합니다.

4.	목록에서 기본 포인트 스타일을 선택합니다. 이 포인트 스타일은 [포인트 스타일] 필드가 <레이어 기준>으로 설정되어 있는 포인트에 적용됩니다.

5.	목록에서 기본 선 스타일을 선택합니다. 이 선 스타일은 [선 스타일] 필드가 <레이어 기준>으로 설정되어 있는 선, 곡선, 호에 적용됩니다.

6.	목록에서 기본 텍스트 스타일을 선택합니다. 이 텍스트 스타일은 [텍스트 스타일] 필드가 <레이어 기준>으로 설정되어 있는 텍스트에 적용됩니다.

7.	레이어의 모든 개체를 표시하고자 하면 [표시] 확인란을 선택합니다.

8.	레이어의 모든 개체를 선택할 수 있으려면 [보호] 확인란을 선택 해제합니다.

9.	[확인]을 누릅니다.


중복 이름의 포인트 병합하기

 개요 및 추가 정보

물리적으로 동일한 것이고, 또한 굳이 여러 개로 나뉘어 있어야 할 필요가 없는 중복 포인트는 Trimble Geomatics Office에서 병합할 수 있습니다.

주의: 2개의 포인트가 이름은 서로 같지만 데이터가 현저히 다르다면, 이는 오류의 결과일 수 있습니다. 이런 포인트를 병합할 경우, 뜻밖의 결과가 나올지 모릅니다.

1.	물리적으로 동일한 포인트인지 아닌지 반드시 확인하도록 합니다. 그 여부는 [선택 / 중복 포인트 / 이름 및 거리 기준] 명령을 실행하면 알 수 있습니다.

2.	분리 간격 거리를 입력하고 [확인]을 누릅니다.

3.	[편집 / 중복 포인트 병합] 명령을 실행합니다.

Trimble Geomatics Office는 해당 포인트에 대한 관측치와 키입력된 위치를 모두 병합합니다. 상태 표시줄에는 이 병합 명령 작업의 요약이 나옵니다.


가져오기시 중복 포인트 처리 방법 정하기

 개요 및 추가 정보

가져오기시 Trimble Geomatics Office는 이름이 같은 포인트를 병합하므로(기본값임), 중복 포인트가 생기지 않습니다. 그 외, [중복 포인트 옵션] 대화 상자에서 수평/수직 허용 편차가 어느 정도 이내이면 포인트를 병합할지 정할 수도 있고, 아니면 가져오기시 중복 포인트를 전혀 해소하지 않도록 설정할 수도 있습니다.

1.	[파일 / 가져오기] 명령을 실행하면 [가져오기] 대화 상자가 나옵니다.

2.	[옵션]을 눌러 [중복 포인트 옵션] 대화 상자를 불러옵니다.

처리 옵션:

  [항상 중복 포인트 병합] 옵션을 선택합니다.

  [허용 편차 이내의 중복 포인트 병합] 옵션을 선택하고 해당 허용 편차를 입력합니다.

  가져오기시 중복 포인트를 해소하지 않도록 설정하려면 [허용 편차 이내의 중복 포인트 병합] 옵션을 선택하고, 수평 허용 편차는 0.02(즉, 수평 측량 등급 허용 편차), 수직 허용 편차는 0.050(즉, 수직 측량 등급 허용 편차)을 각각 입력합니다.

참조: 허용 편차를 지정하지 않으면(즉, [허용 편차] 상자에서 [수평] 확인란과 [수직] 확인란을 선택하지 않으면), 중복 포인트는 병합되게 됩니다.

참조: 허용 편차를 0.000으로 설정하면 중복 포인트는 그 좌표가 조금도 다르지 않아야만 병합이 됩니다.

이 설정은 모든 가져오기 옵션에 적용됩니다. 즉, 프로젝트 표시줄을 이용하여 파일을 가져오거나, 아니면 마우스로써 파일을 Trimble Geomatics Office 프로젝트에 끌어다 놓는 방식을 쓰거나 상관없이 소프트웨어는 현행 중복 포인트 설정 내용을 그대로 적용합니다.


중복 포인트 이름 변경

 개요 및 추가 정보

두 측량자가 별개의 Survey Controller (*.dc) 파일에서 서로 다른 포인트에 동일한 이름을 쓴 경우, 이 절차를 이용하여 해당 중복 포인트의 이름을 변경합니다.

1.	[중복 포인트 옵션] 대화 상자에서 [허용 편차 이내의 중복 포인트 병합] 옵션을 이용함으로써 파일을 가져옵니다. 수평 허용 편차는 0.02, 수직 허용 편차는 0.050으로 각각 설정합니다.

참조: 중복 포인트가 있다는 사실을 데이터를 가져온 이후 단계에서 알았다면 그 가져오기 명령을 실행 취소한 다음, [중복 포인트 옵션] 대화 상자의 [허용 편차 이내의 중복 포인트 병합] 옵션을 수평 허용 편차는 0.02(즉, 수평 측량 등급 허용 편차), 수직 허용 편차는 0.050(즉, 수직 측량 등급 허용 편차)으로 각각 설정하고 해당 데이터를 다시 가져옵니다.

2.	중복 포인트를 데이터베이스에 발생시킨 Survey Controller (*.dc) 파일의 선택 집합을 선택합니다. 대신, [선택 / 중복 포인트/이름 기준] 명령을 실행하여도 됩니다.

3.	[편집 / 이름 변경] 명령을 실행합니다. [이름 변경] 대화 상자가 나옵니다.

4.	그 선택 부분에 있는 첫째 포인트의 새 이름을 입력합니다.

Trimble Geomatics Office가 그 선택 집합에 있는 포인트의 이름을 모두 변경합니다. 새 이름은 설정한 시작 값에 의거, 정해집니다.

예를 들어, 선택한 포인트가 5 개라고 가정할 때, 첫 포인트의 이름을 '2000'이라 정하면 나머지 포인트의 이름은 2001, 2002, 2003, 2004가 됩니다.


사용자 정의 라벨로써 포인트 라벨 붙이기

 개요 및 추가 정보

다음은 어떤 포인트에 이 포인트를 설명하는 사용자 정의 라벨을 붙이는 예시입니다.

1.	사용자 정의 라벨 옵션을 넣고자 하는 프로젝트 템플리트나 프로젝트의 Options.ini 파일을 Microsoft Windows 탐색기에서 찾습니다.

2.	텍스트 편집기로써 그 Options.ini 파일을 엽니다.

3.	다음 표제를 찾습니다.

[Labels]

4.	제일 마지막 라벨 옵션 다음에 다음과 같이 입력합니다.

|X|[Y]

여기서 X는 라벨의 이름을, Y는 포인트의 라벨에 쓸 필드 코드를 정의합니다.

5.	Trimble Geomatics Office의 프로젝트 템플리트나 프로젝트를 불러옵니다.

6.	[보기 / 포인트 라벨]을 선택합니다. [포인트 라벨에 쓸 항목] 대화 상자가 나오는데 새 옵션이 목록에 들어가 있습니다.

7.	필요한 옵션을 선택하고 [확인]을 누릅니다.


개체 주석 달기

 개요 및 추가 정보

1.	주석을 달고자 하는 포인트나 선, 호를 선택합니다. 선택 수단은,

  마우스나

  [선택] 메뉴

2.	[삽입 / 주석] 명령을 실행하면 [주석 달기] 대화 상자가 나옵니다.

3.	필요한 템플리트를 목록에서 선택합니다.

4.	주석 템플리트를 편집하려면 [템플리트]를 누릅니다.

  기존 주석을 계속 유지하려면 [기존의 주석 유지] 확인란을 선택합니다.

  새 주석을 적용하기 전에 기존 주석을 제거하려면 [기존의 주석 유지] 확인란을 선택 해제합니다.

5.	주석 달기의 대상을 특정한 선택 개체 그룹에 한정하고자 하면 [주석 달기] 상자의 옵션을 '선택 부분'으로 설정합니다.

주석 달기의 대상을 전체 데이터베이스로 하고자 하면 [주석 달기] 상자의 옵션을 '전체 데이터베이스'로 설정합니다.

선택한 개체가 없을 경우에는 [주석 달기] 상자를 이용할 수 없고, 주석 달기의 대상이 전체 데이터베이스로 됩니다.

6.	[확인]을 눌러 그 주석을 적용합니다.

해당 주석이 데이터베이스에 추가되고 그래픽 창에 나타납니다.


선택 집합 만들기

 개요 및 추가 정보

1.	선택 집합에 포함시키고자 하는 개체(포인트, 선, 관측치, 곡선, 호, 텍스트, 주석)를 선택합니다. 선택 수단은,

  마우스나

  [선택] 메뉴

2.	[선택 / 선택 집합 / 저장]을 선택하면 [저장] 대화 상자가 나옵니다.

3.	선택 집합의 이름을 입력하고 [확인]을 누릅니다.

이제 [선택 / 선택 집합 / 검색]을 실행하면 저장된 선택 집합의 목록에 이 선택 집합이 나오는 것을 알 수 있습니다. 이것은 최근 이용한 선택 집합의 목록([선택 / 선택 집합]을 실행하면 나옴)에도 나옵니다.

팁: 선택 집합을 보려면 [보기 필터] 대화 상자를 이용합니다.


GPS 사이트 캘리브레이션 수행하기

 개요 및 추가 정보

Trimble Geomatics Office에서 GPS 사이트 캘리브레이션을 수행해야 하는 상황:

  Trimble Survey Controller에 캘리브레이션을 전송하고자 하는 경우

  현장에서 캘리브레이션을 하지 못했을 경우

  QC 레코드에 대한 보고서를 만들고자 하는 경우

  Trimble Survey Controller에서 수행한 캘리브레이션에 별도의 포인트를 추가하고자 하는 경우


GPS 사이트 캘리브레이션의 수행 준비

GPS 사이트 캘리브레이션을 수행하기에 앞서 비GPS (그리드) 데이터나 GPS 데이터(WGS-84)로써 도출한 좌표가 각 캘리브레이션 점에 있는지 확인하도록 합니다.

Trimble Survey Controller에서 캘리브레이션을 수행하였고, 그 그리드 점과 GPS 점의 이름이 같았다면 이들은 가져오기시 병합되었을 가능성이 많습니다. 병합된 포인트들은 Trimble Geomatics Office에서 GPS 사이트 캘리브레이션을 수행하고자 하면 자동으로 분리됩니다. 이 경우, 그리드 점과 GPS 점에 쓰인 이름이 같다는 메시지가 나옵니다.

처리 옵션:

  이름이 같은 GPS 점과 그리드 점을 데이터베이스에 별도로 만들고자 하면 [예]를 누릅니다.

  GPS 사이트 캘리브레이션을 수행하지 않거나 사용자가 직접 포인트를 분해하고자 하면 [취소]를 누릅니다. 직접 포인트를 분해할 경우에는 GPS 점의 이름 변경을 할 수도 있습니다.


GPS 사이트 캘리브레이션 수행하기

1.	[측량 / GPS사이트 캘리브레이션] 명령을 실행하면 [GPS 사이트 캘리브레이션] 대화 상자가 나옵니다.

2.	계산하고자 하는 캘리브레이션 매개 변수를 [캘리브레이션 요소] 상자에서 선택합니다.

3.	[포인트 목록]을 누르면 [포인트 목록] 대화 상자가 나옵니다.

4.	이 대화 상자를 이용하여 캘리브레이션에 쓸 포인트 쌍(GPS 점과 그리드 점)을 선택합니다. 이것은 별개의 GPS 값과 그리드 값이 있는 한, 동일한 이름의 같은 포인트일 수도 있고 다른 포인트일 수도 있습니다.

5.	캘리브레이션에 쓰고자 하는 첫 GPS 점의 선택 방법:

  필드 필인(Field fill-in) 기능을 이용하여 해당 포인트를 선택하거나

  키보드로써 해당 포인트의 이름을 입력합니다.

그래픽 창의 해당 GPS 점에 네모 상자가 나옵니다.

참조: 대응하는 그리드 점의 이름이 같다면 포인트 목록이 자동으로 채워집니다.

6.	선택한 GPS 점의 관련 그리드 점을 입력하는 방법:

  필드 필인 기능을 이용하여 해당 포인트를 선택하거나

  키보드로써 해당 포인트의 이름을 입력합니다.

그래픽 창의 해당 그리드 점에 십자 모양이 나오고, 새로운 항목이 [포인트 목록] 대화 상자에 추가됩니다.

[방식] 필드는 선택한 포인트에 수평이나 수직 좌표 구성 요소(또는 둘 다)가 있는지 나타냅니다. 공통되는 좌표 구성 요소가 없다면 [방식] 필드가 유효하지 않아 이 좌표를 이용하지 못합니다.

7.	위의 5 ~ 6 단계를 반복함으로써 필요한 포인트 쌍을 전부 선택합니다.

8.	포인트 쌍의 선택 작업이 완료되면 [닫기]를 눌러 [GPS 사이트 캘리브레이션] 대화 상자로 되돌아 갑니다.

참조: [포인트] 대화 상자의 하단에 캘리브레이션 통계가 나오는데, 이것은 유효한 포인트 쌍을 입력한 후에 계산됩니다. 이 통계는 부정확한 포인트 쌍의 식별에 이용합니다.

9.	[계산]을 눌러 캘리브레이션 매개 변수를 계산합니다. 캘리브레이션의 결과가 [계산 요약] 상자에 나옵니다.

10. 그 결과가 예상 범위 밖일 경우에는 GPS 사이트 캘리브레이션 보고서를 검토해서 포인트 쌍 사이에 큰 잔차가 있는지 확인합니다. [보고서] 단추를 누르면 이 보고서가 기본 HTML 뷰어에 나옵니다.

11. 보고서의 'GPS 좌표와 알려진 좌표 간의 잔차' 섹션에서 그 잔차를 확인합니다. 필요한 경우, 문제의 발생 가능성이 있는 포인트 쌍을 제거한 다음, 다시 캘리브레이션을 합니다.

12. [확인]을 눌러 프로젝트에 캘리브레이션을 적용합니다.

이 캘리브레이션 매개 변수를 토대로 좌표계가 업데이트됩니다.


피쳐 코드 처리하기

 개요 및 추가 정보

1.	[선택 / 선택 집합 / 검색]을 선택합니다. [검색] 대화 상자가 나옵니다.

2.	처리할 파일(피쳐 코드가 수집되는 파일)과 이름이 같은 선택 집합을 선택합니다. 이 선택 집합은 파일을 가져올 때 자동으로 만들어지는데, 현장에서 포인트를 수집한 순서가 기록된 레코드가 들어 있습니다. 이 선택 집합을 이용함으로써, 피쳐 코드를 올바른 순서대로 처리하게 됩니다.

3.	[도구 / 피쳐 코드 처리]를 실행하면 [피쳐 코드 처리] 대화 상자가 나옵니다.

4.	피쳐 코드의 처리에 필요한 라이브러리를 선택하고 [확인]을 누릅니다.

Trimble Geomatics Office가 피쳐 코드를 처리합니다. 처리된 피쳐 코드가 그래픽 창에 나옵니다.


인버스 보기

 개요 및 추가 정보

두 프로젝트 포인트간의 인버스를 결정하는 방법:

1.	[측량 / 인버스] 명령을 실행합니다. [인버스] 대화 상자가 나오고, 포인터가 필드 필인 포인터(Field fill-in pointer)로 변합니다.

2.	인버스 계산에 필요한 첫 포인트를 클릭합니다. 그 포인트의 이름이 [인버스] 대화 상자의 [시점] 필드에 나옵니다.

3.	인버스 계산에 필요한 둘째 포인트를 클릭합니다. 마우스를 이 둘째 포인트에 위치시키면 점선이 나옵니다.

그 포인트의 이름이 [인버스] 대화 상자의 [종점] 필드에 나오고, [인버스] 상자에는 인버스 값이 자동으로 표시됩니다.

참조: 키보드로써 [시점] 필드와 [종점] 필드에 포인트를 입력하는 경우에는 [계산]을 눌러 그 인버스를 계산합니다.

4.	[자세히]를 누르면 [상세 명세] 상자가 이 대화 상자의 아래에 붙어 나오는데, 인버스 계산에 대한 추가 정보를 볼 수 있습니다.

5.	인버스 보고서를 만들고자 하면 [보고서로 보내기]를 누릅니다. 현재의 표시 옵션('자세히' 또는 '간단히') 여하에 따라 간이 보고서가 나오기도 하고 상세 보고서가 나오기도 합니다.

6.	[보고서 보기]를 누르면 해당 보고서가 HTML 뷰어에 나옵니다.

7.	다른 인버스를 보려면 포인트 필드를 클릭하여 다시 선택합니다.


면적 측정하기

방위각과 거리, 면적을 봅니다. 거리와 방위각은 선택한 여러 지점 중, 바로 직전의 두 개 사이에서 이루어지는 것입니다.

1.	[측량 / 측정] 명령을 실행하면 [측정] 대화 상자가 나옵니다.

2.	그래픽 창에서 첫째 위치(포인트일 필요는 없음)를 클릭합니다.

3.	그래픽 창에서 다른 위치를 계속 클릭합니다. 어떤 위치를 선택할 때마다 그 좌표를 토대로 [측정] 대화 상자의 필드가 계산됩니다. 선택한 위치 사이를 연결하는 선이 나타납니다.

이 대화 상자의 필드들은 새 위치를 클릭할 때마다 업데이트됩니다. 그 값은 데이터베이스에 저장되지 않습니다.

4.	모든 값을 지우려면 [리셋]을 누릅니다.


좌표 변환 수행하기

 개요 및 추가 정보

좌표 변환을 함으로써 선택 포인트를 평행 이동하거나 회전시킵니다. 아래에는 기존 포인트의 알려진 좌표를 입력함으로써 데이터베이스의 포인트를 모두 변환하는 방법을 예시합니다.

1.	변환 또는 회전시키고자 하는 포인트를 선택합니다.

2.	[측량 / 좌표 변환] 명령을 실행하여 [좌표 변환] 대화 상자를 불러옵니다.

3.	[포인트 목록]을 누르면 [좌표 변환 − 포인트 목록] 대화 상자가 나옵니다.

4.	옵션:

  [포인트] 필드에 기존 포인트 이름을 입력합니다.

  필드 필인 기능을 이용하여 포인트를 선택합니다.

[포인트] 필드, [현재 X 좌표] 필드, [현재 Y 좌표] 필드가 채워지고, [알려진 X 좌표] 필드가 선택됩니다.

5.	[알려진 X 좌표] 필드와 [알려진 Y 좌표] 필드에서의 옵션:

  그 포인트의 알려진 X 좌표와 Y 좌표를 입력합니다.

  필드 필인 기능을 이용하여 그 포인트의 알려진 X 좌표와 Y 좌표를 선택합니다.

알려진 좌표와 현재 좌표와의 차이를 보여주는 선이 그래픽 창에 나옵니다.

[통계] 상자에는 축척 계수와 최대 수평 잔차가 나옵니다. 이것은 불량 포인트 쌍의 식별에 이용합니다.

6.	[확인]을 누르면 잔차를 표시하는 대화 상자가 나옵니다.

7.	[좌표 변환] 대화 상자가 다시 나옵니다. 현재 좌표로부터 계산된 값과 알려진 좌표가 [N 방향 평행 이동] 필드와 [E 방향 평행 이동] 필드에 입력됩니다.

8.	[확인]을 눌러 이 좌표 변환을 전체 데이터베이스에 적용합니다.

참조: 좌표 변환은 실행 취소할 수 있습니다.


표고 조정 수행하기

 개요 및 추가 정보

선택한 포인트의 표고를 조정하려면 표고 조정을 이용합니다. 아래에는 기존 포인트의 알려진 표고를 입력함으로써 데이터베이스의 포인트 표고를 모두 변환하는 방법을 예시합니다.

1.	[측량 / 표고 조정] 명령을 실행하여 [표고 조정] 대화 상자를 불러옵니다.

2.	[포인트 목록]을 누르면 [표고 조정 − 포인트 목록] 대화 상자가 나옵니다.

3.	옵션:

  [포인트] 필드에 기존 포인트 이름을 입력합니다.

  필드 필인 기능을 이용하여 포인트를 선택합니다.

선택한 포인트에 네모 상자가 나옵니다.

[포인트] 필드, [현재 X 좌표] 필드, [현재 Y 좌표] 필드, [현재 표고] 필드가 채워집니다.

4.	다음 중, 하나를 실행합니다.

  [알려진 표고] 필드에 그 포인트의 알려진 표고를 입력합니다.

  필드 필인 기능을 이용하여 다른 포인트의 표고를 선택합니다.

[통계] 상자에는 축척 계수와 최대 조정 경사, 최대 수직 잔차가 나옵니다. 이것은 불량 포인트 쌍의 식별에 이용합니다.

5.	[확인]을 누르면 [표고 조정] 대화 상자가 다시 나옵니다.

사용된 첫째 포인트의 좌표가 [원점 N]과 [원점 E] 필드에 들어 갑니다. [보정 상수] 필드에는 계산된 표고 조정으로써 채워집니다. [단위 N당 보정치]와 [단위 E당 보정치] 필드는 표고 조정의 정의에 쓰는 포인트의 수가 2개 이상일 경우에만 채워집니다.

6.	[확인]을 눌러 이 표고 조정을 전체 데이터베이스에 적용합니다.

참조: 표고 조정은 실행 취소할 수 있습니다.


필드 코드 사용하기

 개요 및 추가 정보

필드 코드를 이용하여 다음을 표시합니다.

  필드의 값

  주석, 보고서, 내보내기 포맷, 텍스트 등의 변수 값

또한 필드 코드는 보고서와 내보내기 포맷을 정의함에 있어 유용하게 쓰입니다. 아래에는 필드 코드를 사용하여 내보내기 포맷을 정의하는 방법을 예시합니다. 이 포맷은 포인트 이름(대문자)과 X 좌표(단위 있는), Y 좌표(단위 있는), 표고(단위 있는)가 들어 있는 콤마 구분형 텍스트 파일입니다.

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[사용자] 탭 하에서 [새 포맷]을 누릅니다. [ASCII 내보내기 포맷 정의] 대화 상자가 나옵니다.

3.	[이름] 필드에 이름을 입력합니다.

4.	[포맷 본문] 필드에서 마우스의 오른쪽 누르기를 합니다. 나오는 바로 가기 메뉴의 [필드 / 이름]을 선택합니다.

'[이름]'이 포맷 본문 상자에 나옵니다.

5.	마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 대문자]를 선택합니다.

'[이름:대문자]'가 포맷 본문 상자에 나옵니다. 이것은 포인트 이름을 모두 대문자로 내보낸다는 것을 의미합니다.

6.	콤마에 이어 스페이스를 입력합니다.

7.	마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / X 좌표]를 선택합니다.

'[X 좌표]'가 콤마 옆에 나옵니다.

8.	마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 단위]를 선택합니다.

'[X 좌표]'가 '[X 좌표:단위]'로 바뀝니다. 이것은 현행 좌표 단위가 파일에 포함된다는 것을 의미합니다.

9.	콤마에 이어 스페이스를 입력합니다.

10. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / Y 좌표]를 선택합니다.

'[Y 좌표]'가 콤마 옆에 나옵니다.

11. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 단위]를 선택합니다.

'[Y 좌표]'가 '[Y 좌표:단위]'로 바뀝니다. 이것은 현행 좌표 단위가 파일에 포함된다는 것을 의미합니다.

12. 콤마에 이어 스페이스를 입력합니다.

13. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 표고]를 선택합니다.

'[표고]'가 콤마 옆에 나옵니다.

14. 마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [필드 / 고급 / 변경자 / 단위]를 선택합니다.

'[표고]'가 '[표고:단위]'로 바뀝니다. 이것은 현행 좌표 단위가 파일에 포함된다는 것을 의미합니다.

15. [확인]을 눌러 이 내보내기 포맷을 저장합니다. [내보내기] 대화 상자가 나옵니다. 만든 포맷이 [사용자] 탭 하의 목록에 나옵니다.

16. 데이터를 이 포맷으로 내보내려면, 이것을 선택하고 [확인]을 누릅니다. [다른 이름으로 저장] 대화 상자가 나옵니다.

17. [파일 이름] 필드에 송출 파일의 이름을 하나 입력합니다.

18. [저장]을 눌러 파일을 만듭니다.


필드 필인 이용하기

 개요 및 추가 정보

필드 필인(Field fill-in) 기능을 이용하여 데이터베이스의 기존 개체로부터 필드의 값을 바로 입력합니다. 필드 필인이 이용 가능할 경우, 필드 필인 포인터가 그래픽 창에 나타납니다. 아래는 텍스트 개체의 추가시 필드 필인을 이용하여 좌표를 선택하는 예시입니다.

1.	[삽입 / 텍스트] 명령을 실행하면 [텍스트 삽입] 대화 상자가 나옵니다.

2.	[텍스트 표현문] 필드에 텍스트를 입력합니다.

3.	[X 좌표] 필드를 선택합니다.

4.	포인터를 그래픽 창에 위치시키면 필드 필인 포인터가 나옵니다.

5.	그래픽 창에서 그 텍스트를 위치시키고자 하는 지점을 클릭합니다. 해당 좌표가 [Y 좌표], [X 좌표] 필드에 자동 입력됩니다.

6.	[확인]을 눌러 그 텍스트를 데이터베이스에 추가합니다.

팁: 필드 필인 기능을 이용하여 어떤 관측치를 클릭함으로써 그 관측 시간을 입력할 수 있습니다.


그래픽상으로 시트 설정하기

 개요 및 추가 정보

1.	[파일 / 시트 설정] 명령을 실행하면 [시트 설정] 대화 상자가 나옵니다.

2.	[최적 맞춤]을 누릅니다.

3.	[원점 N]이나 [원점 E] 필드를 누르면 필드 필인 포인터가 나옵니다.

4.	플롯 영역의 왼쪽 상단 코너로 삼고자 하는 위치를 그래픽 창에서 클릭합니다.

5.	선택한 도면 양식에서 프로젝트 데이터를 최적으로 맞춰 넣을 수 있게 회전도를 설정합니다.

6.	플롯 상자를 그래픽 창에서 드래그하여 프로젝트 데이터상으로 둡니다.

7.	축척을 표준값으로 변경합니다. 예를 들어, 플롯의 최적 맞춤이 1:435이라면 1:500으로 변경합니다.

8.	[확인]을 눌러 이 시트 설정을 적용합니다.


프로젝트의 지오이드 모델 선택하기

 개요 및 추가 정보

프로젝트에 대한 지오이드 모델을 선택하려면 좌표계 마법사를 이용합니다. 현행 좌표계의 지오이드 모델을 변경하고자 하는 경우에도 마찬가지입니다.

1.	[파일 / 프로젝트 등록 정보] 명령을 실행하여 [프로젝트 등록 정보] 대화 상자를 불러옵니다.

2.	[좌표계] 탭을 선택합니다.

3.	[좌표계 설정] 상자에서 [변경]을 누르면 [좌표계 선택] 대화 상자가 나옵니다.

4.	[새 좌표계] 옵션을 선택하고 [다음]을 누릅니다. [좌표계 종류 선택] 대화 상자가 나옵니다.

5.	적합한 좌표계 종류를 선택합니다. 좌표계 선택 마법사의 마지막 단계에 [지오이드 모델 선택] 대화 상자가 나오면 필요한 지오이드 모델을 선택합니다. 이 지오이드 모델 목록은 좌표계 데이터베이스로부터 읽어온 것인데, 좌표계의 기본 지오이드 모델이 기본값으로 선택됩니다.

6.	[종료]를 누릅니다.

선택한 지오이드 모델이 프로젝트에 적용됩니다.

참조: Coordinate System Manager 유틸리티를 이용하여 좌표계의 기본 지오이드 모델을 선택할 수 있습니다.


속성이 있는 포인트를 프로젝트간 잘라내기/복사하기

 개요 및 추가 정보

1.	복사하고자 하는 원본 포인트를 해당 프로젝트에서 선택합니다. '평면도 보기' 모드에서 [선택 / 포인트 피쳐 기준] 명령을 이용하여 특정 피쳐가 있는 포인트를 선택합니다.

2.	이 포인트를 복사하려면 [편집 / 복사] 명령을 실행합니다.

3.	대상 프로젝트에서 [편집 / 붙여넣기] 명령을 실행함으로써 이 포인트를 붙여넣습니다.

4.	만일 이 두 프로젝트의 속성 정의가 상이하다면 대화 상자가 나옵니다.

5.	양쪽의 피쳐 및 속성 라이브러리에 공통되는 데이터를 붙여넣고자 하면 [예]를 누릅니다. 붙여넣지 못한 속성 데이터는 모두 Paste.rpt 보고서에 기록됩니다. 이 보고서는 대상 프로젝트의 보고서 폴더에 저장됩니다.

참조: 프로젝트 사이에 포인트만 잘라내거나 복사할 수 있습니다. 관측치가 포인트의 위치 설정에 이용되었다면 그 도출 좌표가 복사됩니다. 또한 포인트가 GPS 좌표와 관측치로부터 도출되었다면 그 WGS-84 좌표가 복사됩니다. 복사된 이 WGS-84 좌표는 대상 프로젝트에서 GPS 사이트 캘리브레이션에 이용할 수 있습니다.


포인트에 속성 추가하기

 개요 및 추가 정보

속성을 추가하려면 속성 이용을 위한 프로젝트 구성을 하여야 합니다.

1.	속성을 추가해 넣으려는 포인트를 선택합니다. 선택 수단은,

  마우스나

  [선택] 메뉴

2.	등록 정보 창을 엽니다.

3.	[속성] 탭에서 페이지 메뉴 아이콘 [image] 을 누르면 바로 가기 메뉴가 나옵니다.

4.	[삽입]을 누르면 속성이 있는 피쳐 코드의 목록이 나옵니다.

5.	추가하고자 하는 피쳐 코드를 선택하면 해당 속성이 나옵니다.

6.	각 속성의 값을 입력하면 이것이 속성 이용을 위한 프로젝트 구성에 쓴 피쳐 및 속성 라이브러리에 부합하는 값인지 Trimble Geomatics Office가 확인합니다.

7.	다른 피쳐 코드(포인트에 추가하고자 하는 속성이 있는)에 대해서도 상기 과정을 반복합니다.


속성 보기

 개요 및 추가 정보

1.	다음 중 한 수단으로 포인트를 선택합니다.

  마우스

  [선택] 메뉴

2.	등록 정보 창을 엽니다.

3.	[속성] 탭을 선택합니다.

속성이 있는 피쳐 코드는 한 번에 하나씩만 볼 수 있습니다. 다른 피쳐 코드는 드롭 다운 목록을 이용하여 봅니다.

참조: [속성] 탭은 프로젝트에 대한 피쳐 및 속성 라이브러리를 [프로젝트 등록 정보] 대화 상자 / [피쳐] 탭으로부터 설정한 경우에만 나타납니다.


속성 편집하기

 개요 및 추가 정보

1.	속성을 누릅니다. 메뉴 속성의 경우에는 그 필드의 오른쪽에 화살표가 나옵니다.

2.	화살표를 누르면 그 속성에 대한 메뉴 옵션의 목록이 나타납니다.

기타 다른 형식의 속성은 키보드로써 직접 입력하여야 합니다.

참조: 속성 정보를 수정할 경우, Trimble Geomatics Office는 올바른 값이 입력되었는지 확인하기 위하여 그 피쳐 및 속성 라이브러리 정의를 체크합니다.


선 삽입하기

 개요 및 추가 정보

1.	다음 중 하나의 방법으로 '평면도 보기' 모드를 선택합니다.

  [보기 / 평면도] 명령을 실행합니다.

  [평면도 보기] 도구 단추를 누릅니다.

  <Alt+2>를 누릅니다.

2.	다음 중 하나의 방법으로 선 삽입 명령을 실행합니다.

  [삽입 / 선]을 선택합니다.

  [선 삽입] 도구 단추를 누릅니다.

[선] 탭이 선택된 상태의 [선 작업 삽입] 대화 상자가 나옵니다.

3.	[시점] 필드에서

  선 정의에 필요한 첫째 포인트를 필드 필인 기능으로써 선택하거나

  선 정의에 필요한 첫째 포인트의 이름을 직접 입력합니다.

4.	[종점] 필드에서

  선 정의에 필요한 둘째 포인트를 필드 필인 기능으로써 선택하거나

  선 정의에 필요한 둘째 포인트의 이름을 직접 입력합니다.

5.	[레이어] 필드에서

  선이 들어갈 레이어를 선택하거나

   만들고자 하는 새 레이어의 이름을 입력합니다.

6.	원하는 선 스타일을 [선 스타일] 필드에서 선택합니다.

7.	다음 중 한 방법으로 이 선을 추가합니다.

  [삽입]을 누릅니다.

  Enter키를 칩니다.

이제 [종점] 필드의 포인트가 [시점] 필드에 나타납니다. 따라서 '시점'을 다시 입력해야 할 필요 없이 계속해서 선을 추가할 수 있습니다.

이 선이 그래픽 창에 나옵니다(이 선에 선택된 레이어가 '표시' 상태로 설정되어 있다면).

8.	선 삽입을 중단하려면 [닫기]를 누릅니다.


곡선 삽입하기

 개요 및 추가 정보

1.	다음 중 하나의 방법으로 '평면도 보기' 모드를 선택합니다.

  [보기 / 평면도] 명령을 실행합니다.

  [평면도 보기] 도구 단추를 누릅니다.

  <Alt+2>를 누릅니다.

2.	[삽입 / 곡선] 명령을 실행합니다. [곡선] 탭이 선택된 상태의 [선 작업 삽입] 대화 상자 가 나옵니다.

3.	[시점] 필드에서

  필드 필인 기능을 이용하여 어떤 포인트를 클릭하거나

  키보드로써 포인트의 이름을 직접 입력합니다.

4.	[종점] 필드에서

  필드 필인 기능을 이용하여 어떤 포인트를 클릭하거나

  키보드로써 포인트의 이름을 직접 입력합니다.

5.	[진입 접선] 필드와 [퇴출 접선] 필드의 값을 '<자동>'으로 설정하면 곡선 정의에 쓰이는 포인트를 바탕으로 하여 접선 값이 자동 입력됩니다. 사용자가 접선 값을 임의로 입력할 수도 있습니다.

6.	[곡선 너비] 필드에는 0과 1사이의 값을 입력합니다. 이 값이 클수록 너비가 넓은 곡선이 됩니다.

7.	[레이어] 필드에서

  곡선이 들어갈 레이어를 선택하거나

  만들고자 하는 새 레이어의 이름을 입력합니다.

8.	이 곡선의 표시에 쓸 선 스타일을 [선 스타일] 필드에서 선택합니다.

9.	다음 중 한 방법으로 이 곡선을 추가합니다.

  [삽입]을 누릅니다.

  Enter키를 칩니다.

이 곡선이 그래픽 창에 나옵니다(이 곡선에 선택된 레이어가 '표시' 상태로 설정되어 있다면). 어떤 곡선에 쓰이는 포인트로부터 또다른 곡선을 추가할 때마다 Trimble Geomatics Office는 기존 곡선을 재계산함으로써 곡선이 매끄럽게 표시되도록 합니다.

10. 곡선 삽입을 중단하려면 [닫기]를 누릅니다.


호 삽입하기

 개요 및 추가 정보

1.	다음 중 하나의 방법으로 '평면도 보기' 모드를 선택합니다.

  [보기 / 평면도] 명령을 실행합니다.

  [평면도 보기] 도구 단추를 누릅니다.

  <Alt+2>를 누릅니다.

2.	[삽입 / 호] 명령을 실행합니다. [호] 탭이 선택된 상태의 [선 작업 삽입] 대화 상자 가 나옵니다.

3.	[시점] 필드에서

  필드 필인 기능을 이용하여 어떤 포인트를 클릭하거나

  키보드로써 포인트의 이름을 직접 입력합니다.

4.	[종점] 필드에서

  필드 필인 기능을 이용하여 어떤 포인트를 클릭하거나

  키보드로써 포인트의 이름을 직접 입력합니다.

5.	기존 포인트를 호의 중심점으로 이용하려면 [중심점] 필드에서

  기존 포인트의 이름을 입력하거나

  필드 필인 기능을 이용하여 기존 포인트를 선택합니다.

그 포인트의 좌표가 [중심 X 좌표] 필드와 [중심 Y 좌표] 필드에 복사됩니다.

6.	[중심점] 필드를 이용하는 대신, [중심 X 좌표] 필드와 [중심 Y 좌표] 필드를 이용하여 중심점 좌표를 정할 수도 있습니다. 필드 필인 기능을 이용하여 그래픽 창의 어떤 지점을 클릭하면 그 좌표가 이 두 필드에 복사됩니다.

중심점도 입력하고 중심점 좌표(중심 X 좌표, 중심 Y 좌표)도 같이 입력하는 경우에는 중심점이 이용됩니다.

7.	우호를 만들고자 하면 [열호] 필드에서 '거짓' 옵션을 택합니다. 열호를 만들고자 하면 '참' 옵션을 선택합니다. 두 포인트를 연결할 수 있는 호는 항상 2가지(열호와 우호. 양자가 합하면 원이 됨)이므로 어느 호를 그리고자 하는지 정하여야 합니다.

8.	[레이어] 필드에서

  호가 들어갈 레이어를 선택하거나

  만들고자 하는 새 레이어의 이름을 입력합니다.

9.	이 호의 표시에 쓸 선 스타일을 [선 스타일] 필드에서 선택합니다.

10. 다음 중 한 방법으로 이 호를 추가합니다.

  [삽입]을 누릅니다.

  Enter키를 칩니다.

이 호가 그래픽 창에 나옵니다(이 호에 선택된 레이어가 '표시' 상태로 설정되어 있다면).

11. 호 삽입을 중단하려면 [닫기]를 누릅니다.


텍스트 삽입하기

 개요 및 추가 정보

1.	다음 중 하나의 방법으로 '평면도 보기' 모드를 선택합니다.

  [보기 / 평면도] 명령을 실행합니다.

  [평면도 보기] 도구 단추를 누릅니다.

  <Alt+2>를 누릅니다.

2.	다음 중 하나를 실행합니다.

  [삽입 / 텍스트]를 선택합니다.

  [텍스트 삽입] 도구 단추를 누릅니다.

[텍스트 삽입] 대화 상자가 나옵니다.

3.	표시하고자 하는 텍스트를 [텍스트 표현문] 필드에 입력합니다. 필드 코드(예: 프로젝트 이름)를 이용하려면 마우스의 오른쪽 단추를 눌러 나오는 바로 가기 메뉴에서 [필드]를 선택합니다.

4.	텍스트를 위치시킬 지점의 X 좌표 값을 [X 좌표] 필드에 입력합니다. 필드 필인 기능을 이용하여 그래픽 창에서 어떤 지점을 클릭하는 방법으로 하여도 됩니다.

5.	텍스트를 위치시킬 지점의 Y 좌표 값을 [Y 좌표] 필드에 입력합니다. 필드 필인 기능을 이용하여 그래픽 창에서 어떤 지점을 클릭하는 방법으로 하여도 됩니다.

6.	텍스트 개체의 배향각을 [배향] 필드에 입력합니다. 달리 지정하지 않으면 텍스트가 창에서 수평 방향으로 나옵니다.

7.	[앵커 형] 필드에는 X 좌표 값과 Y 좌표 값을 기준으로 한 텍스트의 위치를 지정하는데, 목록에서 그 값을 택합니다.

8.	[레이어] 필드에서는 텍스트가 들어갈 레이어를 목록에서 선택합니다. 텍스트를 새 레이어에 넣으려면 이 필드에 새 이름을 쳐넣습니다.

9.	[텍스트 스타일] 필드에서는 텍스트 개체에 대한 텍스트 스타일을 목록에서 선택합니다. 레이어에 설정된 기본 텍스트 스타일을 필요로 한다면 '<레이어 기준 >' 옵션을 선택합니다.

10. [삽입]을 눌러 이 텍스트를 데이터베이스에 추가합니다. 추가할 텍스트가 더 있다면 이 과정을 계속 진행합니다.

11. 텍스트 삽입을 중단하려면 [닫기]를 누릅니다.


새 프로젝트 템플리트 만들기

 개요 및 추가 정보

1.	다음 중 하나를 실행합니다.

  [새로 만들기] 도구 단추를 누릅니다.

  [파일 / 새 프로젝트]를 선택합니다.

[새 프로젝트] 대화 상자가 나옵니다.

2.	[새로 만들기] 상자에서 '템플리트' 옵션을 선택합니다. [상세 명세] 상자에서 프로젝트 폴더가 기본 템플리트 폴더로 바뀝니다.

3.	[이름] 필드에는 이 프로젝트 템플리트의 이름을 입력합니다.

4.	[템플리트] 필드에서는 목록으로부터 템플리트를 하나 선택하고 [확인]을 누릅니다. [프로젝트 등록 정보] 대화 상자가 나옵니다.

5.	이 템플리트를 이용하는 프로젝트를 만들 때, 기본값으로 적용할 프로젝트 등록 정보를 설정하고 [확인]을 누릅니다.

메시지가 나옵니다. 이 템플리트에서 처리할 작업이 더 있으면 [예]를 누르고 종료하려면 [아니오]를 누릅니다.

6.	[예]를 택한 경우, 남은 작업을 이 프로젝트 템플리트에서 계속하다가 [파일 / 닫기] 명령을 실행함으로써 종료합니다.

7.	이제 이 새 템플리트가 [새 프로젝트] 대화 상자의 템플리트 목록에 나옵니다.


포인트 스타일 만들기

 개요 및 추가 정보

1.	'평면도 보기' 모드에서 [편집 / 스타일] 명령을 실행하여 [CAD 스타일] 대화 상자를 불러옵니다.

2.	[포인트 스타일] 탭에서 [새로 만들기]를 누릅니다. [포인트 스타일 만들기] 대화 상자가 나옵니다.

3.	이 대화 상자의 기재 항목을 모두 입력합니다.

4. 	[확인]을 누릅니다.

이 포인트 스타일이 데이터베이스에 추가되며, [CAD 스타일] 대화 상자 � [포인트 스타일] 탭 하에 나옵니다.


등록 정보 창 열기

 개요 및 추가 정보

다음 중 한 방법으로 등록 정보 창을 엽니다.

  [편집 / 등록 정보] 명령을 실행합니다.

  [등록 정보 편집] 도구 단추 [image] 를 누릅니다.

  바로 가기 메뉴에서 [등록 정보] 항목을 선택합니다.

  그래픽상에서 개체를 더블 클릭합니다.

  <Alt + Enter>를 누릅니다.


Trimble Survey Controller 소프트웨어에 데이터 딕셔너리 (.ddf) 파일 내보내기
Trimble Survey Controller에 데이터 딕셔너리 (.ddf) 파일 내보내기

 개요 및 추가 정보

참조: Trimble Survey Controller 버전 7.00 이상이 실행 중인 장치에만 .ddf 파일을 전송할 수 있습니다.

1.	[파일 / 내보내기] 명령을 실행하여 [내보내기] 대화 상자를 불러옵니다.

2.	[측량] 탭 하에서 '데이터 딕셔너리 파일을 Survey Controller로 (*.ddf)' 옵션을 선택하고 [확인]을 누르면 [선택] 대화 상자가 나옵니다.

3.	Trimble Survey Controller로 전송하고자 하는 파일을 선택하고 [열기]를 누르면 [다른 이름으로 저장] 대화 상자가 나옵니다.

4.	Survey Controller 장치를 선택하고 [열기]를 누르면 [연결 중] 대화 상자가 나옵니다.

장치에 연결이 되면 '주 메모리 (C:)'가 상자에 나옵니다. 현재 PC 카드가 장치에 들어 있으면 'PC 카드 (A:)'도 나옵니다.

참조: 사용자의 Trimble 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

5.	옵션을 선택합니다.

  파일을 Trimble Survey Controller의 주 메모리에 저장하려면 주 메모리 (C:) 옵션을 선택합니다.

  파일을 PC 카드에 저장하려면(PC 카드가 삽입되어 있어야 함) PC 카드 (A:) 옵션을 선택합니다.

6.	[열기]를 누릅니다. 주 메모리나 PC 카드에 있는 기존 데이터 딕셔너리 파일이 나타납니다.

7.	내보내려고 선택한 .ddf 파일의 내부 이름이 [파일 이름] 필드에 나옵니다. 이것이 Trimble Survey Controller에서 보게 될 이름입니다.

8.	필요한 경우, 이 이름을 수정합니다.

9.	[저장]을 누르면 [업로드 중] 대화 상자가 나오는데, 파일 전송의 진행도를 표시하는 막대가 나옵니다.

전송이 완료되면 이 대화 상자가 사라지고 그래픽 창으로 되돌아 갑니다. 이제 Trimble Survey Controller에서 이 .ddf 파일을 이용할 수 있습니다.

참조: Trimble Survey Controller 버전 7.60과 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


.dc 파일을 프로젝트로 끌어다 놓기
파일을 프로젝트로 끌어다 놓기

 개요 및 추가 정보

파일을 프로젝트에 끌어다 놓으려면:

1.	파일을 전송보낼 Trimble Geomatics Office 프로젝트를 불러옵니다.

2.	Microsoft Windows 탐색기를 엽니다.

3.	가져올 파일이 들어 있는 폴더를 찾습니다.

4.	가져올 파일에 커서를 두고 마우스의 오른쪽 단추를 누릅니다.

5.	파일을 Trimble Geomatics Office 그래픽 창으로 드래그합니다.

6.	마우스 오른쪽 단추를 놓으면 바로 가기 메뉴가 나옵니다.

7.	해당되는 파일 옵션을 선택합니다.

8.	마우스의 왼쪽 단추를 눌러 파일을 가져옵니다.

가져오기 과정에 대한 자세한 사항은 가져오기 − 개요를 참조하십시오. 파일은 프로젝트의 Data Files/Trimble Files 폴더에 저장됩니다.


이름 기준으로 포인트 선택하기

1.	[선택 / 포인트] 명령을 실행하여 [포인트 선택] 대화 상자를 불러옵니다.

2.	[일반] 탭을 선택합니다.

3.	선택하고자 하는 포인트의 이름을 [이름 조건] 필드에 입력합니다. 범위와 와일드 카드 문자를 써서 여러 개의 포인트를 선택할 수도 있습니다.

4.	[확인]을 누릅니다. 입력한 이름에 부합하는 포인트가 선택됩니다. 선택된 포인트의 수가 상태 표시줄에 표시됩니다.

참조: [포인트 선택] 대화 상자를 이용하기 전에 이미 선택되어 있었던 개체는 [현재 선택 부분에 추가] 확인란을 선택하지 않는 한, 선택 집합에 계속 유지되지 않습니다.


등급 기준으로 포인트 선택하기

1.	[선택 / 포인트] 명령을 실행하여 [포인트 선택] 대화 상자를 불러옵니다.

2.	[일반] 탭을 선택합니다.

3.	선택하고자 하는 구성 요소와 등급을 [포인트 등급 조건] 필드에 입력합니다. 목록에서 개체를 여러 개 선택할 수 있습니다.

4.	[확인]을 누릅니다.

일치하는 포인트가 선택됩니다. 선택된 포인트의 수가 상태 표시줄에 표시됩니다.

참조: [포인트 선택] 대화 상자를 이용하기 전에 이미 선택되어 있었던 개체는 [현재 선택 부분에 추가] 확인란을 선택하지 않는 한, 선택 집합에 계속 유지되지 않습니다.


선택된 포인트로부터 관측치 선택하기

1.	'측량 보기' 모드에서 [선택 / 관측치] 명령을 실행하여 [관측치 선택] 대화 상자를 불러옵니다.

2.	[시점] 필드에 포인트 이름을 입력합니다. 선택 부분에서 복수의 포인트를 이용하려면 범위를 입력합니다. 필드 필인 기능과 와일드 카드를 이용할 수도 있습니다.

3.	[확인]을 누릅니다.

일치하는 관측치가 선택됩니다. 선택된 관측치의 수가 상태 표시줄에 표시됩니다.

참조: [포인트 선택] 대화 상자를 이용하기 전에 이미 선택되어 있었던 개체는 [현재 선택 부분에 추가] 확인란을 선택하지 않는 한, 선택 집합에 계속 유지되지 않습니다.


관측치 이용 해제하기

1.	'측량 보기' 모드에서 어떤 관측치를 선택합니다.

2.	다음 중 하나를 실행합니다.

  등록 정보 창을 엽니다. 요약 아이콘 [image] 을 누른 다음, [상태] 필드에서 '불이용' 옵션을 선택합니다.

  [편집 / 관측치 이용/불이용] 명령을 선택합니다.

참조: 관측치를 이용 해제하면 재계산을 통하여 측량 정보를 업데이트할 필요가 있습니다. 어떤 포인트를 이동할 경우, 이 포인트를 종점으로 하는 관측치는 모두 자동으로 이용 해제됩니다.


Trimble Survey Controller 소프트웨어로부터 Trimble Geomatics Office 소프트웨어로 작업 가져오기
Trimble Survey Controller로부터 Trimble Geomatics Office로 작업 가져오기

1.	다음 중 한 방법을 택합니다.

  [파일 / 가져오기] 명령을 실행합니다.

  [가져오기] 도구 단추를 누릅니다.

2.	[측량] 탭 하에서 측량 장치 옵션을 선택하고 [확인]을 누릅니다. Data Transfer의 [열기] 대화 상자가 나옵니다.

3.	Trimble Survey Controller 장치를 선택합니다.

4.	[열기]를 누르면 [연결 중] 대화 상자가 나옵니다. 연결이 되면 [열기] 대화 상자가 업데이트되고 선택한 장치가 표시됩니다.

5.	전송하고자 하는 파일을 다음 옵션 중 하나에서 선택합니다.

  Trimble Survey Controller 주 메모리에 저장된 파일은 주 메모리 (C:) 옵션

  Survey Controller에 삽입된 PC 카드의 저장 파일은 PC 카드 (A:) 옵션

참조: 사용자의 Trimble 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

6.	[열기]를 누르면 [받는 중] 대화 상자가 열리는데, 전송 진행도를 표시하는 막대가 나옵니다.	전송이 완료되면 이 대화 상자가 사라지고 해당 장치와의 연결이 끊어집니다.


도구 모음 숨기기/표시하기

1.	방법 옵션:

  해당 도구 모음의 영역에서 마우스의 오른쪽 단추를 누르면 바로 가기 메뉴가 나옵니다.

  [보기 / 도구 모음] 명령을 실행하면 메뉴가 나옵니다.

도구 모음의 목록이 나옵니다. 현재 표시 상태인 도구 모음의 이름 옆에는 체크 마크가 되어 있습니다.

2.	체크 마크가 되어 있는 도구 모음은 일단 선택을 하게 되면 Trimble Geomatics Office 그래픽 창에서 사라집니다.

3.	이 도구 모음을 다시 표시하려면 상기 단계를 반복합니다.


Trimble Survey Controller 소프트웨어에 안테나 내역 전송하기
Trimble Survey Controller에 안테나 내역 전송하기

1.	[파일 / 내보내기] 명령을 실행하여 [내보내기] 대화 상자를 불러옵니다.

2.	[측량] 탭 하에서 '안테나 내역을 Survey Controller로' 옵션을 선택합니다. Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

3.	Trimble Survey Controller 장치를 선택하고 [열기]를 누르면 [연결 중] 대화 상자가 나옵니다. 연결이 되면 저장 대화 상자가 나옵니다.

4.	옵션을 선택합니다.

  파일을 Trimble Survey Controller의 주 메모리에 저장하려면 주 메모리 (C:) 옵션을 선택합니다.

  파일을 PC 카드에 저장하려면(PC 카드가 삽입되어 있어야 함) PC 카드 (A:) 옵션을 선택합니다.

참조: 사용자의 장치에 PC 카드가 없다면 이 대화 상자는 이용할 수 없습니다.

5.	[열기]를 누릅니다. 선택한 저장 위치를 시스템이 읽고 그 디렉토리의 Survey Controller 파일을 모두 표시합니다. [파일 이름] 필드에 Trimble Geomatics Office 프로젝트 이름이 나옵니다. 이것은 Trimble Survey Controller에 내보낼 Trimble Survey Controller 작업의 이름입니다. 필요한 경우, 이 이름을 변경할 수 있습니다.

6.	[저장]을 누르면 [업로드 중] 대화 상자가 열리는데, 전송 진행도를 표시하는 막대가 나옵니다.

Antenna.ini 파일(\Program Files\Common Files\Trimble\Config 폴더에 위치)이 Trimble Survey Controller로 전송됩니다.

전송이 완료되면 [업로드 중] 대화 상자가 사라지고 그 장치와의 연결이 끊어집니다.


속성 비고 내보내기

1.	[파일 / 내보내기] 명령을 실행하여 [내보내기] 대화 상자를 불러옵니다.

2.	[CAD / ASCII] 탭 하에서 'DC 파일 속성 비고 (Survey Controller V4)' 옵션을 선택하고 [확인]을 누릅니다. [다른 이름으로 저장] 대화 상자가 나옵니다.

3.	파일 이름을 입력합니다.

4.	[저장]을 누릅니다.


Trimble Geomatics Office 소프트웨어의 정보 표시하기
Trimble Geomatics Office의 정보 표시하기

1.	[도움말] 메뉴에서 [Trimble Geomatics Office 정보] 명령을 선택합니다. [Trimble Geomatics Office 정보] 대화 상자가 나옵니다.

2.	[확인]을 누릅니다.


관측 방향 반전하기

1.	반대 방향으로 적용하고자 하는 관측치를 '측량 보기' 모드에서 선택합니다.

2.	[편집 / 관측 방향 반전] 명령을 실행합니다.

3.	그 방향이 반전됩니다. 이 때 포인트의 계산 좌표와 등급이 바뀔 수 있습니다.

주의: 관측 시점으로 하고자 하는 포인트에 어떤 알려진 위치(RTK 관측된 포인트)가 없다면 이 관측치는 적용되지 않습니다.

참조: 토탈 스테이션으로 수집한 비GPS 관측치는 반전하지 못합니다.


오류 및 경고 보기

1.	오류 및 경고를 보는 방법:

  '측량 보기' 모드 하에서 경고 표시 플래그가 있는 포인트나 관측치를 더블 클릭하거나

  상태 표시줄의 플래그 아이콘을 더블 클릭함으로써 경고 표시 플래그가 있는 포인트나 관측치를 모두 선택합니다.

선택한 개체와 함께 등록 정보 창이 나옵니다.

2.	보고자 하는 포인트나 관측치를 등록 정보 창에서 선택합니다. (선택 부분에 개체가 2개 이상 있는 경우)

3.	'경고' 페이지를 보려면 경고 메뉴 단추 [image] 를 누릅니다.

어떤 유형의 오류가 발생하였는지 보여주는 메시지가 나옵니다.

4.	포인트에 대한 추가 내역을 보려면 [포인트 도출 보고서] 도구 [image] 를 누릅니다.

포인트 도출 보고서가 나옵니다.


UK National Grid (*.pgf) 파일을 Trimble Survey Controller 소프트웨어로 전송하기
UK National Grid (*.pgf) 파일을 Trimble Survey Controller로 전송하기

참조: .pgf 파일은 Trimble Survey Controller 버전 7.50 이상에만 전송할 수 있습니다.

1.	다음 중 하나의 방법으로 Trimble Data Transfer 유틸리티를 실행합니다.

  열려 있는 프로젝트가 없는 경우, [유틸리티 / Data Transfer]를 선택합니다.

  아무때나 [시작 / 프로그램 / Trimble / Trimble Utilities / Data Transfer]를 선택합니다.

[데이터 전송] 대화 상자가 나옵니다.

2.	[보내기] 탭을 선택합니다.

3.	파일을 내보내고자 하는 대상 Survey Controller 장치를 [장치] 목록에서 선택합니다. Trimble Data Transfer 유틸리티는 선택한 장치로의 연결을 시도하는데, 연결이 되면 우측 상단에 있는 아이콘의 케이블이 바뀌며 해당 장치로 연결되었음을 나타냅니다. 또한 이 아이콘의 바로 아래에 '<장치>에 연결되었습니다.'라는 메시지가 나타납니다(여기서 <장치>는 Survey Controller와 같은 장치의 종류를 말함).

4.	[추가]를 누르면 [열기] 대화 상자가 나옵니다. [위치] 목록에는 해당 장치에 대하여 가장 최근에 파일을 선택해 온 폴더가 나오는데, 이 폴더에 있는 파일과 하위 폴더가 주 목록에 표시됩니다.

5.	[파일 형식] 필드의 목록에서 'UK National Grid 파일 (*.PGF)' 옵션을 택합니다.

6.	[위치] 목록과 목록 상자를 이용하여 드라이브와 폴더를 변경하고, 전송하고자 하는 파일을 선택합니다.

Trimble Geomatics Office에 딸려 제공된 .pgf 파일을 전송하려면 Program Files\Common Files\Trimble\Geodata 폴더의 North.pgf나 East.pgf 파일을 선택합니다.

7.	파일은 주 메모리나 PC 카드(설치된 경우)에 전송할 수 있습니다. 전송 목적지를 [대상처] 목록에서 선택합니다.

8.	[파일 포맷] 필드를 '작업 파일 v7.50'으로 설정합니다. 필요하다면 목록에서 이 옵션을 선택합니다.

9.	[선택]을 선택하면 [열기] 대화 상자가 닫기면서 [데이터 전송] 대화 상자로 되돌아 갑니다. 선택한 파일이 [보낼 파일] 목록에 나옵니다.

10. [전송]을 누르면 파일이 그 장치의 파일 포맷으로부터 변환되면서 [변환 중] 대화 상자가 나옵니다. 모든 파일이 변환되면 [보내는 중] 대화 상자가 나와 파일 송출 작업의 진행도를 표시합니다.

전송이 완료되면 [전송 완료] 대화 상자가 나오고 이 전송의 결과가 표시됩니다.

참조: Trimble Survey Controller 버전 7.60과 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


저장된 캘리브레이션 좌표와 조정된 좌표(Network Adjustment모듈로부터 도출된)를 이용하여 캘리브레이션
저장된 캘리브레이션 좌표와 조정된 좌표(Network Adjustment모듈로부터 도출된)를 이용하여 캘리브레이션 하기

1.	최소 제약 조정을 완료하고 WGS-84 좌표를 결정한 후, 이 좌표를 관측된 GPS 좌표로서 저장함으로써 추후의 사이트 캘리브레이션에 이용합니다. 캘리브레이션 좌표는 WGS-84 위도, 경도 및 타원체고로써 구성됩니다.

캘리브레이션 좌표 저장 방법:

  [조정 / 캘리브레이션 좌표 / 저장]을 선택하면

[캘리브레이션 좌표 저장] 대화 상자가 나옵니다.

참조: 이 명령은 조정 데이텀으로 WGS-84가 선택되어 있고, 이전의 조정 작업에 GPS 관측치만 포함되어 있을 경우에만 이용할 수 있습니다.

참조: 조정 변환 매개 변수가 조정 과정에서 생성되었을 경우, 이 매개 변수는 GPS 사이트 캘리브레이션을 수행하면 폐기됩니다. Trimble Geomatics Office는 어느 것이든 하나만 허용합니다.

2.	다음 중 하나를 선택합니다.

  '기존 포인트 하에서 좌표 만들기' 옵션

  '접미어가 있는 새 포인트 하에서 좌표 만들기' 옵션

3.	[확인]을 눌러 캘리브레이션 좌표를 저장합니다.

참조: 이 망 조정의 각 포인트에 대하여 WGS-84 좌표가 생성됩니다. 이 좌표는 등록 정보 창에서 볼 수는 있지만 수정하지는 못합니다.

4.	프로젝트 데이텀에서 제약 조정을 수행합니다(그 방법은 Network Adjustment 도움말의 해당 항목 참조). 데이터베이스에 그 조정된 값이 저장됩니다.

참조: 이 망 조정의 제약되지 않은 각 포인트에 대하여는 조정된 그리드 좌표가 생성됩니다. 이 좌표는 등록 정보 창에서 볼 수 있습니다.

5.	망 조정으로 도출된 포인트 쌍을 이용하여 GPS 사이트 캘리브레이션을 수행합니다. [측량 / GPS 사이트 캘리브레이션] 명령을 실행하여 [GPS 사이트 캘리브레이션] 대화 상자를 불러오도록 합니다.

6.	계산하고자 하는 캘리브레이션 매개 변수를 [캘리브레이션 요소] 상자에서 선택합니다.

7.	[포인트 목록]을 누릅니다. [포인트 목록] 대화 상자가 나옵니다.

8.	이 대화 상자를 이용하여 캘리브레이션에 쓸 포인트 쌍(GPS 점과 그리드 점)을 선택합니다. 옵션:

  필드 필인 기능을 이용하거나, 저장된 캘리브레이션 좌표의 이름을 [GPS 점] 필드에 입력합니다.

  필드 필인 기능을 이용하거나, 조정된 대응 좌표의 이름을 [그리드 점] 필드에 입력합니다.

최소 제약 좌표가 동일한 포인트 하에 저장되었다면 이 그리드 점 필드는 자동 입력됩니다. GPS 점이 입력될 때 나타나는 값은 저장된 캘리브레이션 좌표에서 온 것입니다. 그리드 점이 입력될 때, 이 조정된 값이 선택됩니다.

9.	상기 과정을 반복함으로써 캘리브레이션에 필요한 포인트 쌍을 모두 선택합니다.

10. 모든 포인트 쌍을 선택하게 되면 [닫기]를 눌러 [GPS 사이트 캘리브레이션] 대화 상자로 되돌아 갑니다.

11. [계산]을 눌러 캘리브레이션 매개 변수를 계산합니다. 캘리브레이션의 결과가 [계산 요약] 상자에 나옵니다.

12. [확인]을 눌러 캘리브레이션을 프로젝트에 적용합니다. 이 캘리브레이션 매개 변수를 토대로 좌표계가 업데이트됩니다. 이제 Trimble Survey Controller에 이 캘리브레이션을 전송할 수 있습니다.


이벤트 보고하기/내보내기

수신기에 이벤트가 로그되는 시간을 기록하기 위한 보고서 포맷이나 내보내기 포맷을 정의할 수 있습니다.

이벤트를 보고하려면 사용자 정의 데이터베이스 보고서를 만듭니다.

1.	Trimble Geomatics Office에서 이벤트 레코드가 있는 포인트를 선택합니다. 선택 방법:

a. [선택 / 포인트] 명령을 실행합니다. [포인트 선택] 대화 상자가 나옵니다.

  	b. [GPS] 탭을 선택합니다.

c. [측량 방식] 목록에서 '이벤트'를 선택합니다.

d. [확인]을 누릅니다.

이벤트 레코드가 있는 포인트가 모두 선택됩니다.

2.	[보고서 / 기타 보고서] 명령을 실행합니다. [기타 보고서] 대화 상자가 나옵니다.

3.	처리 옵션:

  기존의 보고서 포맷을 수정하려면 [편집]을 누릅니다.

  새 보고서 포맷을 만들려면 [새로 만들기]를 누릅니다.

[보고서 포맷 정의] 대화 상자가 나옵니다.

4.	[포맷 본문] 필드에서 마우스의 오른쪽 누르기를 하여 나오는 바로 가기 메뉴로부터 [고급 / 서브 레코드 / 포인트 관측치 / 시간]을 선택합니다.

사용자 이벤트 정의를 위한 이벤트 내보내기:

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[사용자] 탭 하에서 다음 중 하나를 택합니다.

  기존 포맷을 수정하려면 [포맷 편집]을 누릅니다.

  새 보고서 포맷을 만들려면 [새 포맷]을 누릅니다.

[ASCII 내보내기 포맷 정의] 대화 상자가 나옵니다.

3.	[포맷 본문] 필드에서 마우스의 오른쪽 누르기를 하여 나오는 바로 가기 메뉴로부터 [고급 / 서브 레코드 / 포인트 관측치 / 시간]을 선택합니다.


시간 포맷 레이아웃

이벤트의 시간을 표시하는 표준 포맷: 09:12:55 8 Feb 2000

이 설정을 변경하려면 필드 코드 옆에서 마우스의 오른쪽 누르기를 합니다. 나오는 바로 가기 메뉴로부터 [고급 / 계속 / 포맷 레이아웃]을 실행한 다음, 샘플 포맷을 하나 선택하거나, 아니면 원하는 포맷을 새로 만듭니다. 자세한 사항은 시간 포맷 레이아웃을 참조하십시오.

참조: 이벤트 시간을 밀리초 단위까지 표시하려면 '<H:mm:ss.nnn>'라는 시간 포맷 레이아웃을 필드 코드에 추가합니다(여기서 'nnn'은 소수 초의 자리수). 예: [포인트 관측치.시간:<H:mm:ss.nnn>]. 시간을 더 정확하게 표시하려면 소수 초의 자리수를 늘립니다. 예를 들어, 'nnnn'은 4자리의 소수 초를 표시합니다.


프로젝트간 관측 데이터 복사하기

Trimble Geomatics Office 프로젝트 사이에 관측 데이터를 복사하려면 Trimble Data Exchange 포맷을 이용합니다. 통상적인 '복사/붙여넣기' 기능은 이용할 수 없습니다.

프로젝트간 관측 데이터를 복사하는 방법:

1.	현재의 Trimble Geomatics Office 프로젝트에서 복사하고자 하는 관측 데이터를 선택합니다.

2.	Trimble Data Exchange 포맷을 이용하여 현행 프로젝트로부터 데이터를 내보냅니다.

a.	[파일 / 내보내기] 명령을 실행하여 [내보내기] 대화 상자를 불러옵니다.

b.	[측량] 탭 하에서 'Trimble Data Exchange 포맷'을 선택하고 [확인]을 누릅니다. [다른 이름으로 저장] 대화 상자가 나옵니다.

c.	그 파일을 저장합니다.

3.	Trimble Geomatics Office에서 새 프로젝트를 만듭니다.

4.	Trimble Data Exchange 포맷을 이용하여 관측 데이터를 이 새 프로젝트에 가져옵니다.

a.	[파일 / 가져오기] 명령을 실행하여 [가져오기] 대화 상자를 불러옵니다.

b.	[측량] 탭 하에서'Trimble Data Exchange 포맷'을 선택하고 [확인]을 누릅니다. [열기] 대화 상자가 나옵니다.

c.	그 파일을 선택합니다.

이제 해당 관측 데이터가 Trimble Geomatics Office 프로젝트로 도입됩니다.

참조: 프로젝트에 있는 모든 관측치와 포인트의 복사본을 만들고자 하면 그 프로젝트 자체를 복사합니다.


비GPS 데이터를 수동으로 가져오기

수동으로 비GPS 데이터를 Trimble Geomatics Office에 가져오려면 Softdesk 야장 포맷을 이용합니다. 이 포맷은 Autodesk에서 개발한 것입니다.

비GPS 데이터를 이용하여 Softdesk 야장 포맷의 파일을 만듭니다.

 이 파일을 Trimble Geomatics Office에 가져옵니다.

a.  [파일 / 가져오기] 명령을 실행함으로써 [가져오기] 대화 상자를 불러옵니다.

b.	[측량] 탭 하에서 제3자 데이터 레코더 파일을 선택하면 [열기] 대화 상자가 나옵니다.

c.	가져오고자 하는 파일을 선택합니다.

d.	[파일 형식] 필드에서 'Autodesk FBK 야장 포맷 파일 (*.FBK)'을 선택하고 [확인]을 누릅니다.

해당 파일이 Trimble Geomatics Office 프로젝트로 도입됩니다.

참조: 아래는 Autodesk Softdesk 야장 포맷에 대한 설명입니다. 이 포맷은 AutoCAD Land Development Desktop 도움말 파일에서 가져온 것입니다.

고려 사항:

  인식하지 못하는 명령어로 시작하는 행은 무시됩니다.

  괄호 () 안에 들어 있는 항목은 임의 사항입니다.

  Trimble Geomatics Office를 위하여 포인트 번호를 이용할 필요가 있습니다.

  포인트 설명(descript)은 야장 포맷 파일 정의의 일부이므로 이중 인용부(")를 써야 합니다. 이는 포인트 설명에 스페이스를 이용할 수 있다는 것을 의미합니다.


포인트 만들기 명령

AD (포인트) [각도] [거리] (설명)

AD [수직각] (포인트) [각도] [거리] [수직 각도] (설명)

AD [수직 거리] (포인트) [각도] [거리] [수직 거리] (설명)

BD (포인트) [방향각] [사분원] [거리] (설명)

BD [수직각] (포인트) [방향각] [사분원] [거리] [수직 각도] (설명)

BD [수직각] (포인트) [방향각] [사분원] [거리] [수직 거리] (설명)

DD (포인트) [각도] [거리] [수직 각도] (설명)

DD [수직각] (포인트) [각도] [거리] [수직 각도] (설명)

DD [수직 거리] (포인트) [각도] [거리] [수직 거리] (설명)

F1/F2 (포인트) [각도] [거리] (설명)

F1/F2 [수직각] (포인트) [각도] [거리] [수직 각도] (설명)

F1/F2 [수직 거리] (포인트) [각도] [거리] [수직 거리] (설명)

NE (포인트) [N] [E] (설명)

NEZ (포인트) [N] [E] (표고) (설명)

NE SS (포인트) [N] [E] (표고) (설명)

PRISM [높이]

PT OFFSET (포인트) [옵셋] (앞)

STADIA (포인트) [각도] [거리] [로드] (수직 각도) (설명)

ZD (포인트) [방위각] [거리] (설명)

ZD [수직각] (포인트) [방위각] [거리] [수직 각도] (설명)

ZD [수직 거리] (포인트) [방위각] [거리] [수직 거리] (설명)


포인트 위치 명령

AZ [포인트 1] [포인트 2] [방위각]

BS [포인트] (배향)

STN [포인트] (기계고) (설명)


장비 보정 명령

ANGLES [우,좌] [천정, 천저, 수평]

ATMOS [ON, OFF]

CR [ON, OFF]

EDM OFFSET  [옵셋]

HORIZ ANGLE [우, 좌]

PRESS [기압] [INCH, MBAR, MM]

SF [계수]

PRISM CONSTANT  [상수]

PRISM OFFSET  [옵셋]

TEMP [온도] [F, C, K]

UNITS [미터, 피트] [DMS, DECDEG, GRAD, MILS, RADIANS]

VERT ANGLE  [천정, 천저, 수평]


등록 정보 창에서 좌표 추가하기

등록 정보 창에서 '요약' 페이지의 [좌표 추가] 도구 [image] 를 써서 포인트의 좌표를 추가할 수 있습니다.

방법:

1.	프로젝트의 포인트를 더블 클릭하여 등록 정보 창을 불러옵니다.

2.	'요약' 페이지에서 [image] 을 누른 다음, 추가하고자 하는 좌표형(그리드, 로컬, WGS 84)을 선택합니다.

등록 정보 창의 트리 구조에서 새 좌표가 해당 포인트 아래에 나옵니다. 좌표 이름에는 그 좌표가 그리드(G)나 로컬(L), WGS-84(W) 중에서 어떤 것인지 나타내는 접두어가 붙습니다. 새 좌표에 대한 '요약' 페이지의 필드는 모두 공백값으로 나타납니다.

참조: 각각의 포인트에 대하여 하나의 WGS-84 좌표와 하나의 그리드나 로컬 좌표만 입력할 수 있습니다. WGS-84 좌표의 추가시, 이 옵션은 좌표 추가 목록에서 이용할 수 없게 됩니다. 또 포인트에 이미 WGS-84 좌표와 그리드(또는 로컬) 좌표가 있다면 [좌표 추가] 단추를 이용할 수 없습니다.

3.	좌표에 대한 [X 좌표], [Y 좌표], [표고], [타원체고] 필드를 입력하려면 각 필드를 클릭한 다음, [현재 값 삽입] 단추 [image] 를 누릅니다. 현재 포인트의 위치와 등급이 각 필드에 입력되는데, 이 정보는 필요한 대로 수정할 수 있습니다.

팁: 관측치 대신 확실히 이 좌표를 이용하고자 하는 경우에만 좌표를 추가하도록 합니다. 재계산에는 키입력된 좌표가 등급이 같은 관측치에 우선하여 쓰입니다. 즉, 설계점이 측설 관측치에 우선하여 이용됩니다.

참조: 이와는 별도로, 다음과 같은 좌표가 Trimble Geomatics Office에서 생성, 저장되기도 합니다.

  조정으로부터 도출된 좌표

  캘리브레이션용으로 저장된 WGS-84 좌표


등록 정보 창에서 좌표 편집하기

 개요 및 추가 정보

Trimble Geomatics Office에서는 등록 정보 창에서 어떤 포인트의 좌표를 변경할 수 있습니다.

방법:

1.	프로젝트에서 포인트를 더블 클릭합니다. 등록 정보 창이 나옵니다.

2.	등록 정보 창의 트리 구조에서 그 포인트에 대한 트리 구조를 펼친 다음, 편집하고자 하는 키입력된 좌표(WGS-84나 그리드/로컬)를 선택합니다.

3.	그 좌표 구성 요소와 좌표 등급을 수정합니다.

참조: 좌표 필드를 편집할 수 있으려면, 좌표 보기 설정과 좌표형 설정이 반드시 동일하여야 합니다.

4.	좌표를 편집한 후, [측량 / 재계산]을 선택하여 재계산 작업을 수행합니다.

등록 정보 창에서의 좌표 추가와 편집에 대한 자세한 사항은 등록 정보 창 � 좌표 항목을 참조하십시오.


디지털 레벨 파일 가져오기

디지털 레벨 (*.dat, *.raw) 파일을 가져오거나, DiNi 디지털 레벨로써(측량 장치를 써서) 파일을 다운로드할 경우, [디지털 레벨 가져오기] 대화 상자가 나옵니다. 가져오기 방법:

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '디지털 레벨 파일 (*.dat, *.raw)'을 선택하고 [확인]을 누르면 [열기] 대화 상자가 나옵니다.

3.	해당 디지털 레벨 파일을 선택하면 [디지털 레벨 가져오기] 대화 상자가 나옵니다.

4.	이 대화 상자에서 '스테이션 포인트' 열의 확인란을 선택함으로써 스테이션 포인트를 정의합니다.

스테이션 포인트간의 델타 표고가 계산됩니다. 스테이션 포인트들은 가져오기를 할 때, 동일한 이름의 다른 포인트와 병합되게 됩니다. 반드시 유일한 포인트 이름을 쓰도록 합니다. 포인트 이름은 [디지털 레벨 가져오기] 대화 상자에서 변경할 수 있습니다.

참조: 스테이션 포인트로서 정의되지 않은 포인트는 가져오지 못합니다.

5.	[디지털 레벨 가져오기] 대화 상자에서 시점에 대한 표고를 입력합니다. 이 표고는 다른 포인트의 표고 계산에 이용됩니다. 시점의 표고를 수정하려면 루프에 있는 아무 포인트나 클릭합니다. 루프의 시점 표고는 [표고] 상자에 표시됩니다. [표고] 상자에서 표고와 그 표고의 질을 수정하고 Enter키를 치면 모든 스테이션 포인트의 표고가 계산되게 됩니다. 계산된 이 표고를 이용함으로써, 알려진 값과의 확인 과정을 거쳐 데이터의 유효성을 점검합니다.

참조: 표고 심벌이 있는 표고만 도입됩니다. 기타 다른 스테이션 포인트는 모두 그 델타 표고가 도입되는데, 실제 표고는 재계산 과정에서 계산됩니다.

팁: [디지털 레벨 가져오기] 대화 상자에서의 변경 내용은 가져오는 데이터에만 영향을 미칩니다. 디지털 레벨 (*.dat, *.raw) 파일에는 영향을 미치지 않습니다.

6.	[확인]을 누르면 해당 디지털 레벨 파일이 도입됩니다.

참조: 가져오는 관측치가 수평 좌표가 없어 그래픽 창에 나타나지 않는 경우가 있습니다. 등록 정보 창에서 이 레벨 데이터를 보려면 선택 도구 단추를 이용하여 해당 관측치를 선택한 다음, 그 등록 정보 창을 엽니다. 이것은 다음 중 하나의 방법으로 실행합니다.

  [편집 / 등록 정보] 명령을 선택합니다.

  해당 도구 모음에서 [등록 정보 창] 도구 단추 [image] 를 선택합니다.

팁: 디지털 레벨 데이터를 수집할 때, Trimble Geomatics Office에 가져오고자 하는 포인트에 접두어나 접미어를 특유하게 붙여 저장합니다. 예를 들어, 스테이션 포인트로 이용하고자 하는 포인트는 모두 접두어 STN을 붙여 저장한다면 [디지털 레벨 가져오기] 대화 상자에서 [필터 기준 선택] 단추를 이용하여 손쉽게 선택할 수 있게 됩니다


Trimble Geomatics Office 소프트웨어에서 배경 맵 보기
Trimble Geomatics Office에서 배경 맵 보기

 개요 및 추가 정보

Trimble Geomatics Office에서 배경 맵을 보려면

1.	[보기 / 옵션] 명령을 실행하면 [보기 옵션] 대화 상자가 나옵니다.

2.	[배경 맵] 탭에서 [추가]를 눌러 [추가] 대화 상자를 불러옵니다.

3.	배경 맵 파일을 선택하고 [확인]을 누릅니다.

참조: Trimble Geomatics Office는 그래픽 창에서 배경 파일을 표시할 수 있습니다. Drawing Exchange 포맷(.dxf)이나 Windows 비트맵(.bmp), Tagged Image File 포맷(.tif)을 가져올 수 있습니다. Windows 비트맵(.bmp)과 Tagged Image File 포맷(.tif) 파일은 georeference가 되어야만 정확히 표시됩니다. ESRI's World file 포맷이 배경 파일의 georeference에 이용됩니다. 이 파일들은 대응하는 배경 파일과 같은 폴더에 있어야 합니다.

배경 맵 파일이 Trimble Geomatics Office에 나옵니다.

Trimble Geomatics Office에서의 배경 맵 이용에 대한 보다 자세한 사항은 보기 옵션 � 배경 맵을 참조하십시오.


Trimble Geomatics Office 소프트웨어에서 그리드 선 보기
Trimble Geomatics Office에서 그리드 선 보기

1.	[보기 / 옵션] 명령을 실행합니다. [보기 옵션] 대화 상자가 나옵니다.

2.	[그리드 선] 탭 하에서 [그리드 선 표시] 확인란을 선택합니다. 이 상자의 옵션들이 활성화됩니다.

3.	[고정 갯수의 그리드 선]이나 [그리드 간격] 옵션을 선택하고, 적절한 값을 각 필드에 입력합니다.

4.	그리드 선 형식과 색상을 선택합니다.

5.	그리드 선에 라벨을 붙이고자 하면, [그리드 선 라벨 붙이기] 확인란을 선택합니다.

6.	[확인]을 누릅니다.


독립 기선 선택하기

독립 기선 집합은 특정 GPS 측량 세션에서 모든 포인트 선점의 연결에 필요한 최소 기선 수로 구성됩니다. n 개의 동시 GPS 점 선점의 경우, 독립 기선의 수는 n � 1 개입니다. 예를 들어, 수신기가 5개인 측량 세션에서 가능한 기선의 수는 10 개이지만 독립 기선은 4 개뿐입니다. 아래 그림에서 대시 선으로 표시된 것이 독립 기선입니다.

독립 기선 집합의 개념은 주로 Static이나 FastStatic 테크닉으로 수행한 측량에 적용되는데, 망 조정을 포함하는 프로젝트에 특히 중요합니다.

독립 기선 집합을 사용하면 망 조정이 인위적 여유도(과대 자유도)의 영향을 받지 않게 되므로 조정된 좌표의 오차를 과소 평가하는 일을 막을 수 있습니다.

3 개 이상의 수신기를 쓴 GPS 측량 세션에서 도출된 기선은 다중 독립 기선으로 형성될 수 있습니다. 독립 집합에 포함되는 기선의 선택은 기선 해의 질을 토대로 하거나, 아니면 원하는 망 기하 구조의 달성을 토대로 할 수 있습니다.

독립 기선 집합은 다음 중 한 방법으로 지정할 수 있습니다.

  GPS 측량 세션의 모든 잠재 기선 가운데 독립 기선 집합만을 선택, 처리합니다.

  GPS 측량 세션의 모든 잠재 기선을 처리하고 그 결과를 프로젝트에 저장하는 시점에 독립 집합을 선택합니다.

  GPS 측량 세션의 모든 잠재 기선을 처리하고 그 결과를 전부 프로젝트에 저장한 후, 종속 기선을 망 조정의 고려 대상에서 제외합니다.

이것은 [종속 기선 보기] 도구 [image] 를 이용하여 처리합니다. 이 도구는 그래픽 창과 Timeline에 있는 관측치들을 서로 링크하는 기능을 합니다. 이 도구를 선택할 경우, 소프트웨어는 현재의 Timeline 화면 안에 있는 후처리 기선, 그리고 이와 동시에 관측된 후처리 기선만을 표시합니다. 측량 보기 화면에서의 기타 다른 후처리 기선은 모두 숨겨집니다.

[종속 기선 보기] 도구를 이용하여 동시 관측된 기선을 표시함으로써 종속 기선이 망 조정에 쓰이는 일을 방지합니다.

이 종속 기선의 처리 옵션:

  등록 정보 창에서 종속 기선의 상태를 불이용으로 변경합니다

  등록 정보 창에서 종속 기선의 상태를 '점검점으로 이용'으로 변경합니다.

  등록 정보 창에서 종속 기선에 대한 [망 조정에 이용] 확인란을 선택 해제합니다.

  등록 정보 창에서 종속 기선에 대한 [사용] 확인란을 선택 해제합니다.

이 작업은 [다중 편집] 대화 상자를 이용하면 가장 효율적으로 수행할 수 있습니다. 예를 들어, 여러 종속 기선의 상태를 '불이용'으로 변경하려면,

1.	[종속 기선 보기] 도구를 선택합니다.

2.	그래픽 창에서 종속 기선들을 선택합니다.

3.	[편집 / 다중 편집] 명령을 실행하면 [다중 편집] 대화 상자가 나옵니다.

4.	[관측치 상태 새로 설정] 확인란을 선택합니다.

5.	목록에서 '불이용'을 선택하고 [확인]을 누릅니다.

이제 해당 관측치들이 불이용 상태로 바뀌게 됩니다.


Trimble 3600/5600 GDM 파일 가져오기

참조: 측량 데이터가 작업 및 영역 파일 둘 다에 포함되어 있는 경우에는 영역 파일을 먼저 가져오도록 합니다.

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 'Trimble 3600/5600 GDM 파일 (*.job, *.are)'을 선택한 다음, [옵션]을 클릭합니다. [설정] 대화 상자가 나옵니다.

3.	Trimble 3600/5600 GDM 제어 유니트의 설정 및 중복 포인트 설정을 명시합니다.

4.	[확인]을 클릭해 변경 사항을 수용하고 [가져오기] 대화 상자로 되돌아 갑니다.

5.	[확인]을 클릭합니다. [열기] 대화 상자가 나옵니다.

6.	가져올 파일을 선택한 후 [열기]를 클릭합니다.

참조: Trimble Geomatics Office에서는 모든 3600/5600 GDM 파일이 축척 계수만의 좌표계로서 정의된다고 간주됩니다. 자세한 내용은 축척 계수만을 참조하십시오.

기타 참조 사항


Trimble 3600/5600 GDM 영역 (*.are) 파일로 내보내기

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 'Trimble 3600/5600 GDM 파일 (*.are)'을 선택한 다음, [옵션]을 클릭합니다. [설정] 대화 상자가 나옵니다.

3.	Trimble 3600/5600 GDM 제어 유니트의 설정을 명시합니다.

4.	[확인]을 클릭해 변경 사항을 수용하고 [내보내기] 대화 상자로 되돌아 갑니다.

5.	[확인]을 클릭합니다. [다른 이름으로 저장] 대화 상자가 나옵니다.

6.	파일 이름과 위치를 명시하고 [저장]을 클릭합니다. (기본값은 프로젝트 이름에 의해 파일 이름이 결정되는 것임)

참조: 영역 파일에로 내보내진 좌표는 Trimble Geomatics Office 프로젝트에서 정의된 좌표계를 사용합니다.

기타 참조 사항


Pcode (*.pco) 파일을 Trimble 3600/5600 측량기에 내보내기

1.	[파일 / 내보내기] 명령을 실행합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 'Pcode 파일을 Trimble 3600/5600 GDM으로 (*.pco)'을 선택한 다음, [확인]을 클릭합니다. [선택] 대화 상자가 나옵니다.

3.	Pcode 파일을 선택한 다음, [열기]를 클릭합니다. Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.

4.	Trimble 3600/5600 GDM 장치를 선택하고  [열기]를 클릭합니다. [연결 중] 대화 상자가 나옵니다. 연결이 되면 저장 대화 상자가 나옵니다.

5.	[저장]을 클릭합니다. 파일 전송의 진척도가 대화 상자에 표시됩니다. 전송이 완료되면 장치와의 연결이 끊어집니다.

기타 참조 사항


가져오기 - 개요
가져오기 − 개요

추가 정보

방법 ...	대화 상자	기타
개요

Trimble Geomatics Office 프로젝트는 다양한 파일 형식의 데이터를 가져올 수 있습니다. 예를 들어, 기준점 포함 파일, 원시 GPS (*.dat) 파일, Survey Controller(*.dc) 파일, 사용자 정의 포맷의 파일 등을 가져올 수 있습니다.

지원되는 가져오기 포맷에 대한 설명을 보려면 [가져오기] 대화 상자를 보십시오.

다음으로부터 데이터를 가져올 수 있습니다.

  Trimble Survey Controller가 실행 중인 장치

  Trimble GPS 수신기

  Trimble 3600/5600 GDM 측량기

  컴퓨터 상의 파일

  토탈 스테이션

  디지털 레벨

파일을 가져올 때 파일의 포인트가 데이터베이스에 추가됩니다. 데이터베이스에 이미 존재하는 것과 동일한 이름의 포인트를 가져올 경우, [중복 포인트 옵션] 대화 상자 에 있는 옵션에 따라 포인트가 병합되는 방법이 달라집니다.

파일을 가져올 때의 결과는 파일의 형식에 따라 다르게 나타납니다. 그러나 모든 파일 형식에 대해 재계산이 자동적으로 실행되고 가져오기 보고서 (<가져온 파일 이름>.html로 명명됨)가 생성된 다음, 프로젝트의 보고서 폴더에 저장됩니다.

어떤 파일에서 가져온 모든 개체는 선택 집합에 저장됩니다. .dc의 확장자를 가지는 선택 집합의 이름은 파일의 내부 작업 이름에 따라 결정됩니다. 다른 파일 형식의 선택 집합의 경우에는 가져온 파일의 이름이 그대로 이용됩니다. 선택 집합을 관리하려면 [선택 / 선택 집합] 명령을 이용합니다.

팁: 선택 집합에서 데이터만 보려면 [보기 필터] 대화 상자 에 있는 선택 집합 옵션에서 [데이터만 표시]를 선택합니다 .

팁: 가져오기 실행을 취소하려면 실행 취소명령을 이용합니다. 가져오기 후에 프로젝트를 닫았을 경우 [포인트 선택] 대화 상자 / [일반] 탭의 [출처조건] 옵션을 이용하여 선택 부분을 삭제함으로 가져오기 실행을 취소할 수 있습니다.

참조: 동일 프로젝트에 어떤 파일을 두 번 이상 가져올 경우 파일 이름 뒤에 dash(-)와 숫자가 붙어서 적절한 폴더에 추가됩니다. 예를 들어 MyGPSFile이라는 원시 GPS (.dat) 파일을 두 번 반복해서 가져올 경우, 첫번째 파일을 가져올 때MyGPSFile이라는 이름의 폴더가 생성됩니다. 이 폴더 내에 MyGPSFile.dat 파일과 MyGPSFile-1.dat 이 저장됩니다. 가져오기를 실행 할 때 중복된 데이터는 자동으로 인식되어 데이터베이스에 추가 되지 않습니다.


[가져오기] 대화 상자

프로젝트에 데이터 가져오기를 실행할 때 이 대화 상자를 이용합니다.

이 기능을 이용하려면 다음 중 한가지 방법을 선택합니다.

  [파일 / 가져오기] 명령을 실행합니다.

  표준 도구모음에서 [가져오기] 단추 [image] 를 클릭합니다.

가져오기 포맷은 다음과 같은 3가지 탭으로 구성되어 있습니다.

  측량

  CAD / ASCII

  사용자

새 포맷

이 단추는 [사용자] 탭을 선택할 경우에 이용할 수 있습니다.

새로운 사용자 정의 포맷을 작성하려면 이 단추를 클릭합니다.

[ASCII 가져오기 포맷 정의] 대화 상자가 나타납니다.

가져오기 포맷을 정의 하려면 이 대화 상자를 이용합니다.

포맷 편집

이 단추는 [사용자] 탭을 선택할 경우에 이용할 수 있습니다.

기존의 ASCII 가져오기 포맷을 수정하려면 이 단추를 클릭합니다.

[ASCII 가져오기 포맷 정의] 대화 상자가 나타납니다.

가져오기 포맷을 수정하려면 이 대화 상자를 이용합니다.

포맷 삭제

이 단추는 [사용자] 탭을 선택할 경우에 이용할 수 있습니다.

사용자 정의 가져오기 포맷을 삭제하고자 할 때 이 단추를 클릭합니다. 실행을 계속할 지 여부를 묻습니다.

포맷 삭제를 실행하려면 [예]를 클릭합니다.

사용자 정의

이 단추를 이용하여 [가져오기] 대화 상자에 나오는 가져오기 옵션의 목록을 선택합니다. 필요한 가져오기 옵션을 체크리스트에서 선택하십시오.

[사용자 정의] 대화 상자로부터 외부 필터를 추가할 수 있습니다. 외부 필터는 사용자가 기록해 넣음으로써 Trimble Geomatics Office와 통합 사용이 가능한 별개의 프로그램입니다. Trimble Geomatics Office 내부에 기록되는 외부 필터는 시스템에 추가하기 위해서는 반드시 특정 요건에 부합하여야만 합니다. [가져오기] 대화 상자의 선택 탭에 대하여 현재 설치된 필터들만이 나옵니다.

모든 필터 프로그램은 반드시 특정 내보내기 함수가 있는 동적 연결 라이브러리(*.dll) 파일로서 컴파일되어야만 합니다. 또한 COM(Component Object Module) 개체로서 만들어져야 합니다.

일단 사용자가 해당 파일을 선택하게 되면 Trimble Geomatics Office는 필터 COM 개체를 컴퓨터에 등록하고 그 .dll 인터페이스가 시스템 요건에 부합하는지 검증합니다. 만일 이에 실패하면 시스템이 필터 등록을 할 수 없다는 메시지가 나옵니다. 필터가 성공리에 설치되면 그 필터의 간이 설명이 대화 상자에 나오게 됩니다.

자세한 사항은 외부 가져오기/내보내기 필터를 참조하십시오.

옵션

도입 파일에 대하여 [옵션]을 클릭함으로써 다음 사항을 처리합니다.

  가져오기시 중복 포인트의 처리 방법 지정

  도입 데이터의 질 등급 설정

  도입 데이터의 단위 지정

  도입 파일의 설정 지정

  데이터를 장치나, 3300/3600/5600 Elta M5, 3600/5600 GDM에 가져오는 옵션 변경

프로젝트에 이용되고 있는 것과 다른 좌표계를 선택하는 경우, Trimble Geomatics Office는 해당 파일을 읽고, 좌표를 프로젝트 좌표계로 변환하고, 포인트들을 저장하고 이들을 프로젝트 좌표계에 표시합니다. 데이터 파일은 동일하게 그대로 유지됩니다.

참조: 데이터 파일로부터 가져온 포인트에 대하여 Trimble Geomatics Office에서 표시되는 좌표 값은 이 파일의 값과 상이할 수 있습니다.


가져오기 포맷 - [측량] 탭
가져오기 포맷 − [측량] 탭

 개요 및 추가 정보

Trimble Survey Controller나 Trimble GPS 수신기, Trimble 3600/5600 GDM 측량기, 토탈 스테이션, 디지털 레벨, 컴퓨터 상의 측량 데이터 파일에서 데이터를 가져올 경우 [측량] 탭을 이용합니다.

이 탭을 이용하려면

1.	[파일 / 가져오기]를 선택합니다.

2.	[측량] 탭을 선택합니다.

사용자 정의 포맷을 이 탭이 있는 곳으로 이동할 수 있습니다. 자세한 정보는Asciiimp.dat 파일을 보십시오.

참조: 끌어다 놓기를 이용하여 파일을 가져올 수도 있습니다.

다음에 열거한 포맷을 가져오기 위해서는 [측량] 탭을 이용합니다.

포맷	가져오는 내용 �
디지털 레벨 파일 (*.dat, *.raw)	디지털 레벨 파일
GPS 데이터 파일 (*.dat)	사용자 컴퓨터에 있는Trimble GPS .dat 파일
그리드 DTM 파일 (*.dtx)	DTMLink 소프트웨어를 사용하여 만든 그리드 DTM
NGS 데이터 시트 파일 (*.dat, *.dsx, *.htm, *.html)	National Geodetic Survey (NGS) 표준 포맷 데이터 파일
Trimble Data Exchange 포맷	Trimble Data Exchange 포맷의 데이터가 있는 ASCII 파일. 이 포맷은 주로 측량 데이터를 다른 소프트웨어 패키지에 전송함에 사용합니다.
정밀 궤도력 파일 (*.sp3, *.e18)	기선처리용 정밀 궤도력 파일. 이 파일은 Common Files 폴더에 저장됩니다. 이를 선택하려면 [GPS 처리 스타일] 대화 상자를 이용합니다.
RINEX 파일 (*.Xxo, *.XXn, *.obs, *.nav)	Receiver Independent Exchange 포맷 파일. 이 포맷은 어떤 제조업자의 GPS 수신기로부터라도 GPS원시 데이터를 전송할 수 있도록 합니다. 항법 파일과 관측치 파일을 동일한 폴더에 가지고 있어야 합니다.
Sokkia 데이터 레코더 파일 (*.sdr)	사용자 컴퓨터에 있는 Sokkia 데이터 레코더 포맷의 파일
SSF/SSK 파일 (*.ssf, *.ssk)	Trimble GPSurvey 소프트웨어를 사용하여 만든 후처리 kinematic 해 파일 또는 후처리 static 해 파일
Survey Controller 파일 (*.dc)	사용자 컴퓨터에 있는 Trimble Survey Controller 포맷 파일.  .dc 파일의 가져오기 작업을 수행 때, 관련 안테나, 측량기 및 프리즘 높이가 있는 모든 GPS 벡터나 관측치는 프로젝트에 저장되며, 이 데이터는 계산에 사용됩니다.
측량 장치	지원되는 토탈 스테이션, 장치, 측량 데이터 카드, 디지털 레벨 및 GPS 수신기로부터 직접 데이터
제 3자 데이터 레코더 파일	외부 가져오기/내보내기 필터를 사용하여, 제공되는 제 3자 데이터 레코더 파일. Trimble Geomatics Office에 딸려 있는 제3자 포맷: Leica GS1-16  SDMS (좌표 설정이 된 포인트를 가져옴) Nikon AP-700 ASCII 데이터 Topcon GTS-700 및 FC-5 포맷 데이터
Trimble 3600/5600 GDM 파일 (*.job, *.are)	Trimble 3600/5600 GDM 데이터 파일
TDS Survey Pro CE 작업 파일 (*.job)	TDS Survey Pro CE 작업 파일을 가져옵니다
TDS Survey Pro CE 원시 파일 (*.raw)	TDS Survey Pro CE 원시 파일을 가져옵니다
Trimble 3300 / 3600 / 5600 Elta M5 파일 (*.dat)	3300 / 3600 / 5600 Elta M5 파일을 가져옵니다
Trimble 3600 / 5600 TDS 좌표 파일 (*.cr5)	Trimble 3600 / 5600 TDS 좌표 파일을 가져옵니다
Trimble 3600 / 5600 TDS 원시 파일 (*.rw5)	Trimble 3600 / 5600 TDS 원시 파일을 가져옵니다
Trimble Elta GPS Controller M5 파일 (*dat)	Trimble Elta GPS Controller M5 파일을 가져옵니다


NGS 데이터 시트 파일 (*.dat, *.dsx, *.htm, *.html) 옵션

National Geodetic Survery(NGS) 표준 포맷 데이터 파일을 가져올 수 있습니다.

Trimble Geomatics Office는 프로젝트로 가져오는 모든 NGS 데이터를 NAD-83 데이텀 (즉 WGS-84 데이텀과 호환)으로 간주합니다.

NGS 데이터를 뚜렷이 NAD-83 데이텀에 기초하지 않는 프로젝트로 가져올 경우 Trimble Geomatics Office는 이 NGS 데이터가 적절한 데이터인지 자신하지 못합니다.

참조: Trimble Geomatics Office는 이름을 기준으로 하여 NAD-83을(즉, 이름이 NAD-83으로 시작하는 데이텀) 인식합니다.

사용자의 데이텀이 NAD-83에 상응하는 것이 아닐 경우 다음과 같은 경고 메시지가 나타납니다.

�사용자의 프로젝트가 NAD 1983 데이텀을 토대로 하지 않는 것 같습니다. 가져오기를 하고 있는 데이터가 NAD 1983 데이텀 기준이고 이 프로젝트 데이텀으로 변환되지 않을 것이기 때문에 문제가 됩니다.

가져오기 작업을 계속하시겠습니까? �

경고: 계속 진행하기로 선택하는 경우 NGS 좌표 는 프로젝트에 정의된 데이텀으로 해석되게 됩니다. 그러므로 이 데이텀이 NAD-83에 상응하는 것이 아닐 경우 잘못된 해석이 됩니다.


CAD/ASCII 가져오기 포맷

[가져오기] / [CAD/ASCII] 탭을 이용하려면:

1.	[파일 / 가져오기] 명령을 실행합니다.

2.	[CAD/ASCII] 탭을 선택합니다.

참조: ASCII 파일을 취급하는 가져오기 포맷은 항상 표준화된 숫자 형식의 데이터를 기대합니다. 표준화된 숫자 형식이란 1000자리 수 구분 기호 및 소수점이 없는 것을 말합니다.

사용자 정의 포맷을 이 탭이 있는 곳으로 이동시킬 수 있습니다. 자세한 정보는Asciiimp.dat 파일을 보십시오.

참조: 끌어다 놓기를 이용하여 파일을 가져올 수도 있습니다.

다음에 열거한 포맷들을 가져오기 위해서는 [CAD/ASCII] 탭을 이용합니다.

포맷	가져오는 내용 �
AutoCAD 파일 (*.dwg, *.dxf)	ASCII 와 2진 .dxf 및 .dwg파일 (dxf 릴리스 14까지)을 사용하는 좌표 설정이 된 포인트 및 선 작업
C & G 표준	C & G 소프트웨어의 표준 ASCII 파일
인용부가 없는C & G	인용부가 없는C & G 소프트웨어의 ASCII 파일
CMM COR 과LEV 파일 (*.cor, *.lev)	Bureaux of Land Management에 의해 사용되는 표준 ASCII 포맷 파일  CMM COR 과 LEV 파일 옵션은 외부 가져오기 필터를 사용하여 제공합니다.
NMEA 파일	NMEA 포맷 파일 (GGA, GGK, and PJK 스트링)로부터의 포인트  NMEA는 National Marine Electronics Association에 의해 개발된 표준으로, 해상 항해 측정기들 간의 통신 항해 데이터에 대한 데이터 포맷을 정의하는 데 사용됩니다.
Pacsoft 포맷	Pacsoft 소프트웨어의 표준 ASCII 파일
SDRmap 좌표	SDRmap 좌표 텍스트 파일
TPLANE (LLHE)	Trimble GPSurvey ASCII 파일
TRIMMAP 그래픽 파일 (*.tgf)	TRIMMAP (또는 SDRmap) *.tgf 그래픽 파일
WILDsoft 포맷	WILDsoft 소프트웨어 표준 ASCII 파일
Terramodel 프로젝트 파일 (*.pro)	Terramodel 프로젝트 파일로부터 포인트, 선작업, 레이어


사용자 정의 가져오기 포맷

[가져오기] / [사용자] 탭을 이용하려면:

1.	[파일 / 가져오기]를 선택합니다.

2.	[사용자] 탭을 선택합니다.

참조: 끌어다 놓기를 이용하여 파일을 가져올 수도 있습니다.

사용자 정의 포맷을 다른 탭이 있는 곳으로 이동시킬 수 있습니다. 자세한 정보는Asciiimp.dat 파일을 보십시오.

다음과 같은 경우 [사용자] 탭을 이용합니다.

  사용자 정의 포맷의 데이터 파일을 가져올 경우

  새 사용자 정의 포맷을 추가할 경우

  기존의 사용자 정의 가져오기 포맷을 수정할 경우

  사용자 정의 가져오기 포맷을 삭제할 경우

다음과 같은 사용자 정의 포맷이 제공됩니다.

  구분형 포인트

  고정 너비 포인트

  이름,E,N,표고,코드

  이름,위도,경도,타원체고,코드 (로컬)

  이름,위도,경도,타원체고,코드 (WGS-84)

  이름,N,E,표고,코드

ASCII 파일의 값을 가져올 경우 Trimble Geomatics Office는 Microsoft Windows에 있는 [제어판 / 국가별 설정] / [숫자] 탭에 정의되어 있는 자릿수 구분 기호와 소수 기호를 사용한 값을 읽을 수 있습니다. 이 시스템은 1000자리 수 구분 기호 와 소수 기호가 없는 표준화된 형식의 값도 읽을 수 있습니다.

모든 사용자 정의 가져오기 포맷은 Asciiimp.dat 파일에 기록됩니다.


[ASCII 가져오기 포맷 정의] 대화 상자

 개요 및 추가 정보

ASCII 가져오기 포맷을 정의할 때 이 대화 상자를 이용합니다.

이 기능을 이용하려면:

1.	[파일 / 가져오기]를 선택합니다. [가져오기] 대화 상자가 나타납니다.

2.	[사용자] 탭에서 다음 중의 한 가지를 실행합니다.

  새 포맷을 만들 경우 [새 포맷]을 클릭합니다.

  기존 포맷을 수정할 경우 [포맷 편집]을 클릭합니다.

이름

가져오기 포맷의 이름을 입력하거나 수정합니다. [가져오기] 대화 상자의 [사용자] 탭 상의 [형식] 목록에 해당 이름이 나타납니다. 중복되는 이름은 사용할 수 없습니다.

공백값 스트링

가져오기 포맷 정의에 공백값 문자를 입력합니다. 이 필드는 선택 사항 입니다. 입력한 공백값 문자는 파일을 가져올 때 특정 레코드에 대한 값이 없는 것으로 해석됩니다.

데이터베이스에 데이터가 추가될 때 Trimble Geomatics Office가 공백 문자를 만나면 해당 데이터베이스 필드에 어떠한 값도 할당하지 않습니다.

참조: 파일 형식에 따라서는 " 99999.99 ", " ***** " , 혹은 그와 유사한 특별한 문자열을 요구할 수도 있습니다. 이 설정을 변경하여 Trimble Geomatics Office에서 사용자의 설정 값을 사용하게 할 수 있습니다.

설명

가져오기 포맷의 설명을 입력합니다. 가져오기 대화 상자에서 해당 포맷을 선택할 때 입력한 내용이 상태 표시줄에 나타납니다. 이 필드는 선택 사항입니다.

기본 확장자

가져오기 포맷을 위한 .dat 혹은 .fbk 와 같은 기본 확장자를 입력합니다. 이 필드는 선택 사항으로서 입력하지 않았을 경우 ".txt"로 간주됩니다.

팁: 모든 확장자를 수용하기를 원하시면 ???를 입력합니다.

참조: Trimble Geomatics Office는 [열기] 대화 상자의 [파일 형식] 필드에 있는 확장자를 사용합니다. [이름] 목록에 있는 특정의 확장자로 파일 이름을 작성합니다.Trimble Geomatics Office는 자동적으로 파일 이름과 확장자 사이에 점이 있는 것으로 간주합니다.

가져오기 형식

가져올 파일의 데이터가 가질 적절한 레코드 종류를 선택 합니다. 이것은 일반적으로 [포인트 정보] 테이블이 됩니다.

포맷 자동 구성

이 단추를 클릭하면 [포맷 삽입] 대화 상자가 열립니다. 포맷 헤더와 본문 정의를 자동으로 초기화 시킬 때 이 대화 상자를 이용합니다. 자세한 정보는 포맷 자동구성을 보십시오.

포맷 헤더

바로 가기 메뉴에 있는 필드코드를 사용하여, 가져올 파일의 초기 고정 부분과 일치하도록 포맷 헤더를 정의를 하거나 건너 뛸 수 있습니다. Trimble Geomatics Office는 파일의 앞에 있는 이 헤더 정의를 한번만 사용합니다. 가져오기 파일에 있는 헤더 줄이 헤더 정의와 일치하지 않으면 파일 읽기가 중지 됩니다. 이 기능은 파일 포맷을 검증하는데 유용합니다.

참조: 헤더 정의에 빈 줄을 삽입하려면<Ctrl+Enter>를 누르십시오.

예를 들어, 헤더 정의가 필드 코드 [$Skip.Line:7]로 되어 있으면 Trimble Geomatics Office는 이 파일에서 첫번째 7줄을 건너뛰고 나머지 부분을 본문에 의해 해석합니다.

포맷 본문

읽고자 하는 파일의 데이터와 일치하도록 바로 가기 메뉴에 있는 필드코드를 사용하여 정의를 할 수 있습니다. 단일 개체와 관련되는 데이터가 여러 줄에서 정의 되었을 경우 <Ctrl+Enter>를 눌러 새로운 정의 열을 만들 수 있습니다.

시스템에서 사용 가능한 필드에 대한 자세한 정보는 필드코드 − 개요를 보십시오.

Trimble Geomatics Office는 파일을 가져올 때, 필드 코드에 기입된 줄의 내용을 정의된 바에 따라 해석하려고 반복 시도합니다. 가져온 파일의 내용이 정의와 일치하지 않을 경우, 가져오기 보고서에 일치하지 않은 사항이 기록되고, 그 다음 프로그램은 정의와 일치하는 파일 데이터를 찾으려고 또 시도합니다.

참조: Trimble Geomatics Office는 헤더 정의 다음 줄에 포맷 본문 정의를 자동으로 추가합니다.

포맷 바닥글

바로 가기 메뉴에 있는 필드코드를 사용하여, 가지고 올 파일의 마지막 고정된 부분과 일치하도록 바닥글 정의를 하거나 건너 뛸 수 있습니다.

Trimble Geomatics Office는 파일의 끝에서 이 바닥글 정의를 한번만 사용합니다. 가져오기 파일에 있는 바닥글 줄이 정의와 일치하지 않으면 파일 읽기가 중지됩니다. 이 기능은 파일 포맷을 검증하는데 유용합니다.

참조: 바닥글 정의에 빈 줄을 삽입하려면<Ctrl+Enter> 를 누르십시오.

Trimble Geomatics Office는 본문 정의 다음 줄에 포맷 바닥글 정의를 자동으로 추가합니다.

사용자 정의 ASCII 가져오기의 예는 사용자 정의 ASCII 가져오기 포맷 - 예를 보십시오.


사용자 정의 ASCII 가져오기 포맷 - 예
사용자 정의 ASCII 가져오기 포맷 − 예

 기타

다음의 예는 ASCII 가져오기 포맷을 어떻게 정의하는가를 보여줍니다.

예 1

다음과 같은 줄을 가지고 있는 파일을 읽을 경우:

파일 포맷 버전 1.00

날짜: 8/11/99

프로젝트: 예

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,TREE

1026,534222.218,263095.934,10.136,TREE

1027,534224.816,263092.579,10.140,POLE

1028,534228.398,263089.101,10.732,FENCE

1041,534236.948,263084.989,11.054,FENCE

1042,534237.326,263087.964,10.982,FENCE

1087,534243.575,263099.773,10.154,MH

다음과 같이 포맷 헤더를 정의할 수 있습니다:

파일 포맷 버전 1.00	파일의 첫째 줄을 확인
[$Skip.Line:2]	정의된 내용이 없는 다음의 두 줄을 건너 뜀

다음과 같이 포맷 본문을 정의할 수 있습니다:

[이름],[Y 좌표],[X 좌표],[표고],[피쳐 코드]

예 2

다음과 같은 줄을 가지고 있는 파일을 읽을 경우:

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 TREE

1026  534222.218  263095.934      10.136 TREE

1027  534224.816  263092.579      10.140 POLE

1028  534228.398  263089.101      10.732 FENCE

1041  534236.948  263084.989      11.054 FENCE

1042  534237.326  263087.964      10.982 FENCE

1087  534243.575  263099.773      10.154 MH

포맷 헤더는 정의되지 않습니다.

다음과 같이 포맷 본문을 정의할 수 있습니다.

[이름:4][Y 좌표:12.3][X 좌표:12.3][표고:12.3] [피쳐 코드]


[포맷 자동 구성 / 포맷 삽입] 대화 상자
포맷 자동 구성 / [포맷 삽입] 대화 상자

사용자 정의 가져오기, 내보내기 포맷, 데이터베이스 보고서의 본문 정의를 자동으로 초기화 시킬 경우 [포맷 자동 구성] 단추를 클릭합니다. [포맷 삽입] 대화 상자가 나옵니다.

참조: 이 단추는 다음과 같은 대화 상자에 나타납니다.

  [파일 / 가져오기] / [ASCII 가져오기 포맷 정의] 대화 상자

  [파일 / 내보내기] / [ASCII 내보내기 포맷 정의] 대화 상자

  [보고서 / 기타 보고서] / [보고서 포맷 정의] 대화 상자

Trimble Geomatics Office는 모든 데이터의 기본 필드코드 값을 생성합니다. 새로운 포맷의 기본으로 이 초기 기본값을 사용하고, 필요 시 내용을 수정할 수 있습니다.

레이아웃

[레이아웃] 상자로 보고서나 정의의 포맷을 제어할 수 있습니다.

참조: 생성된 보고서는 후에 HTML 편집기를 사용하여 수정할 수 있습니다.

고정 너비

각 필드에 기본 고정 너비를 지정하려면 정의에서 [고정 너비] 옵션을 선택합니다.

참조: 이 옵션에서는 가져오기나 내보내기 정의에서 기본 헤더 정보가 생성되지 않습니다.

구분

필드를 입력할 때에는 [구분] 옵션을 선택합니다. 이 옵션은 보고서나 정의에서 필드 사이의 구분자를 설정할 수 있도록 해 줍니다.

참조: 이 옵션에서는 모든 경우에 기본 헤더 정보가 생성됩니다.

필드 분리 기호

보고서나 정의에서 필드 사이에 삽입하는 문자를 지정하고자 할 경우 [필드 분리 기호] 필드를 사용합니다.

팁: 이 필드에는 기본값이 사용되지만 사용자가 원하는 어떠한 문자도 입력할 수 있습니다.

텍스트 구분자

보고서나 정의의 각 텍스트 필드 전 후에 추가할 문자를 지정하고자 할 경우 [텍스트 구분자] 필드를 사용합니다.

팁: 이 필드에는 기본값이 사용되지만 원하는 어떠한 문자도 입력할 수 있습니다.


내보내기 - 개요
내보내기 − 개요

방법 ...	대화 상자	기타

다른 포맷의 데이터가 요구될 경우 프로젝트에서 데이터 내보내기를 합니다. 예를 들어 다른 소프트웨어 패키지에서 데이터를 사용하기를 원할 때나 Trimble Survey Controller에 파일을 보내고자 할 때 이 기능을 사용할 수 있습니다.

Trimble Geomatics Office 프로젝트에서 다양한 파일 포맷으로 데이터를 내보낼 수 있습니다. 예를 들어 다음과 같은 곳으로 데이터를 내보낼 수 있습니다.

  Trimble Survey Controller (피쳐 및 속성 라이브러리 등 필드 작업을 완성하기 위한 파일이 필요할 때)

  다양한 ASCII 포맷 (예를 들어 다른 포맷의 데이터가 필요할 때)

  다양한 일반GIS 포맷

  사용자 정의 포맷 (사용자 정의 포맷을 정의할 때)

지원되는 내보내기 포맷에 대한 설명은 [내보내기] 대화 상자를 보십시오.


[내보내기] 대화 상자

프로젝트에서 데이터를 내 보내려면 이 대화 상자를 이용합니다.

이 기능을 이용하려면 다음 중의 하나를 실행합니다.

  [파일 / 내보내기]를 선택합니다.

  [내보내기] 단추 [image] 를 선택합니다.

참조: ASCII 파일을 출력하는 내보내기 포맷은 항상 표준화된 형식 (1000자리수 구분 기호 및 소수점이 없는 것)으로 숫자 데이터를 출력합니다. ASCII 파일의 송출 데이터는 Trimble Geomatics Office의 사용 디스플레이 단위로 표시됩니다. 하지만 이와 다른 단위를 '송출 데이터의 단위' 목록에서 지정할 수 있습니다. 또는, [파일 / 프로젝트 등록 정보]를 선택하여 [프로젝트 등록 정보] 대화 상자가 열리면 [단위와 포맷] 탭을 선택함으로써 Trimble Geomatics Office의 화면 표시 단위를 변경할 수도 있습니다.

상태 표시줄에 내보내기 포맷의 형태를 표시하기 위해서는 내보내기 포맷을 선택합니다. 내보내기 포맷은 다음과 같은 탭으로 되어 있습니다.

  측량

  CAD / ASCII

  GIS

  사용자

새 포맷

이 단추는 [사용자] 탭을 선택할 경우에 이용할 수 있습니다.

새로운 사용자 정의 보고서 포맷을 작성하려면 이 단추를 클릭한 다음, [ASCII 내보내기 포맷 정의] 대화 상자를 이용하여 내보내기 포맷을 정의합니다.

포맷 편집

이 단추는 [사용자] 탭을 선택할 경우에 이용할 수 있습니다.

기존 ASCII 내보내기 포맷을 바꾸려면 이 단추를 클릭한 다음, [ASCII 내보내기 포맷 정의] 대화 상자를 이용하여 내보내기 포맷을 변경합니다.

이 대화 상자를 이용하여 내보내기 포맷을 변경합니다. 사용자 정의 포맷 정의에 대한 더 자세한 정보를 원하시면 ASCII 내보내기 포맷 - 예를 보십시오.

포맷 삭제

이 단추는 [사용자] 탭을 선택할 경우에 이용할 수 있습니다.

사용자 정의 내보내기 포맷을 삭제하려면 이 단추를 클릭한 다음, 명령 수행을 확인할지 취소할지 정합니다.

사용자 정의

이 단추를 이용하여 [내보내기] 대화 상자에 나오는 가져오기 옵션의 목록을 선택합니다. 필요한 내보내기 옵션을 체크리스트에서 선택하십시오.

[사용자 정의] 대화 상자로부터 외부 필터를 추가할 수 있습니다. 외부 필터는 사용자가 기록해 넣음으로써 Trimble Geomatics Office와 통합 사용이 가능한 별개의 프로그램입니다. Trimble Geomatics Office 내부에 기록되는 외부 필터는 시스템에 추가하기 위해서는 반드시 특정 요건에 부합하여야만 합니다. [내보내기] 대화 상자의 선택 탭에 대하여 현재 설치된 필터들만이 나옵니다.

모든 필터 프로그램은 반드시 특정 내보내기 함수가 있는 동적 연결 라이브러리(*.dll) 파일로서 컴파일되어야만 합니다. 또한 COM(Component Object Module) 개체로서 만들어져야 합니다.

일단 사용자가 해당 파일을 선택하게 되면 Trimble Geomatics Office는 필터 COM 개체를 컴퓨터에 등록하고 그 .dll 인터페이스가 시스템 요건에 부합하는지 검증합니다. 만일 이에 실패하면 시스템이 필터 등록을 할 수 없다는 메시지가 나옵니다. 필터가 성공리에 설치되면 그 필터의 간이 설명이 대화 상자에 나오게 됩니다.

자세한 사항은 외부 가져오기/내보내기 필터를 참조하십시오.

옵션

송출 파일에 대하여 [옵션]을 클릭함으로써 다음 사항을 처리합니다.

  송출 데이터의 단위 지정

  송출 파일의 설정 지정

  송출하고 있는 데이터 파일의 좌표계 변경

  데이터를 장치나, 3300/3600/5600 Elta M5, 3600/5600 GDM에 내보내는 옵션 변경

내보내기 포맷을 설정할 수 없을 경우에는 이 단추를 이용할 수 없습니다.

내보낼 특정 파일에 대한 자세한 내용을 설정할 경우 [옵션]을 클릭합니다. 예를 들어 AutoCAD (*.dxf 혹은 *.dwg) 포맷의 경우, AutoCAD 내보내기 옵션 데이터 포맷(.dwg, Ascii .dxf, Binary .dxf) 및 AutoCAD 버전 번호를 선택하고, 프로토타입 제도를 선택할 수 있습니다.

송출 데이터의 좌표계

내보내려고 하는 데이터 파일의 좌표계를 선택하려면 [옵션] 대화 상자에서 [변경]을 클릭합니다. 이 단추는 현재 선택된 포맷의 파일에 좌표계 정의가 없을 경우에만 사용할 수 있습니다. 프로젝트에 사용되고 있는 것과 다른 좌표계를 선택하는 경우, Trimble Geomatics Office는 송출 포인트의 좌표를 선택한 좌표계로 변환하고, 송출 파일을 기록하며 포인트를 선택한 좌표계에 저장합니다.

참조: Trimble Geomatics Office에 표시되는 포인트의 좌표 값은 파일에 기록된 값과 다를 수 있습니다.

내보내기

[선택] 도구를 이용하여 현재를 선택한 경우, 선택한 데이터만 내보낼 것인지 혹은 전체 데이터베이스를 내보낼 것인지 선택 할 수 있습니다.

두 가지 선택을 할 수 있습니다.

선택 부분	선택한 포인트만 내보내기
전체 데이터베이스	모든 데이터 포인트를 내보내기
현재의 선택을 하지 않았을 경우에는 [선택] 단추는 이용할 수 없고, 내보내기가 전체 데이터베이스에 적용됩니다.

데이터 정렬

데이터가 내보내어지는 순서를 선택할 수 있습니다.

1.	[데이터 정렬] 확인란을 선택합니다.

2.	목록에서 정렬 순서를 선택합니다. 다음과 같은 것을 선택할 수 있습니다.

데이터베이스 순서	표고
이름	질
시작 시간	데이터 형
선점 길이

참조: 등록 정보 창에서도 동일한 정렬 옵션을 이용할 수 있습니다.

팁: 사용자가 정렬방법에 대한 질의를 할 수 있고 이는 목록에 추가 됩니다. 자세한 내용을 알기 원하면 데이터베이스 질의 � 개요를 참조합니다.


내보내기 포맷 - [측량] 탭

 개요 및 추가 정보

파일이나 장치로 측량 데이터를 내보내려면, [내보내기] 대화 상자의 [측량] 탭을 사용합니다.

이 기능을 이용하려면:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나타납니다.

2.	[측량] 탭을 선택합니다.

[사용자] 포맷을 이 탭으로 이동할 수 있습니다. 자세한 정보는Asciiexp.dat 파일을 보십시오.

이 탭은 다음과 같은 포맷을 포함합니다.

옵션	내보내는 내용 �
안테나 내역을 Survey Controller로	Trimble Survey Controller로 새로운 안테나 내역을 내보냅니다. 예를 들어, Trimble의 새로운 안테나 제품이 나오면, 이 내보내기 옵션을 사용하여 해당 안테나 내역을 사용자의 Trimble Survey Controlle로 전송합니다.
배경 맵을 Trimble Survey Controller로(*.dxf)	dxf 파일을 Trimble Survey Controller (버전 10 이상)로 내보냅니다.
콤마 구분형 좌표 파일을 Trimble Survey Controller로(*.csv)	csv 파일을 Trimble Survey Controller (버전 10 이상)로 내보냅니다.
Data 딕셔너리를 Survey Controller로 (*.ddf)	Trimble Survey Controlle를 사용하는 장치에 데이터 딕셔너리(.ddf) 파일을 내보냅니다. 이를 위해서는 Survey Controller 장치를 설정해 놓아야 합니다. 데이터 딕셔너리 편집기 유틸리티에서 .ddf 파일을 만들 수 있습니다. 이 유틸리티는 Trimble GPS Pafhfinder소프트웨어의 일부입니다. 참조: Trimble Survey Controller (버전7.00)로 내보낼 수 있는 파일은 .ddf 파일 뿐입니다.
데이텀 그리드를 Survey Controller로(*.cdg)	데이텀 그리드를 Trimble Survey Controller (버전 7.00 이상)로 내보냅니다. 전송(subgrid)되는 데이텀 그리드 파일의 크기를 축소할 수 있습니다. 이전 버전의 Trimble Survey Controller는 데이텀 그리드를 지원하지 않습니다.  이를 위해서는 Survey Controller 장치를 설정해 놓아야 합니다.  참조: 현재 프로젝트 좌표계에서 사용되는 데이텀 그리드 파일만 서브 그리드할 수 있습니다. 그러나 결합된 데이텀 그리드는 어떤 것이나 내보낼 수 있습니다.
설명 파일을 TDS 장치로(*.txt)	TDS 소프트웨어를 사용하는 장치에 설명 파일(*.txt)을 내보냅니다. 이를 위해서는 TDS 장치를 설정해 놓아야 합니다. 수동으로 설명 파일을 만들 수도 있고, Feature Code Editor 유틸리티로부터 하나를 내보낼 수도 있습니다.
DTM 점을 파일로 (*.dtx)	프로젝트에서 선택된 포인트들의 DTM (*.dtx) 파일로 Trimble Survey Controller와 호환되는 파일
DTM 점을 Survey Controller로	선택된 포인트들의 DTM (*.dtx) 파일로 Trimble Survey Controller와 호환되고, Trimble Survey Controller로 직접 내보내기 작업을 할 수 있는 파일  이를 위해서는 Survey Controller 장치를 설정해 놓아야 합니다.
피쳐 및 속성 라이브러리를 SDR33 파일로 (*.sdr)	선택하는 라이브러리에 있는 각 피쳐 코드에 대한 비고 레코드를 가진 SDR33파일. 이 옵션으로 속성은 내보낼 수 없습니다.
피쳐 및 속성 라이브러리를 Survey Controller로 (*.fcl)	Trimble Survey Controller를 실행하는 장치로 피쳐 및 속성 라이브러리를 전송. 파일에 특정 속성을 포함시킬 수도 포함시키지 않을 수도 있습니다. (만약 속성을 포함시켜 내보내기를 원하면 이 확인란을 선택합니다)  이를 위해서는 Survey Controller 장치를 설정해 놓아야 합니다. 피쳐 및 속성 라이브러리의 다른 정보 (예를들면 포인트 스타일)는 Trimble Survey Controller로 전송되지 않습니다.
Geoid 파일을 Survey Controller로(*.ggf)	Trimble Survey Controller (버전 6 이상)를 실행하는 장치로 지오이드 그리드 파일을 내보냅니다. 작업 영역을 선택할 수 있습니다. 이는 전송되는 지오이드 그리드 파일의 크기를 축소합니다.  이를 위해서는 Survey Controller 장치를 설정해 놓아야 합니다. 참조: 서브 그리드를 원하면 지오이드 모델이 정의된 좌표를 사용해야 합니다. 현재 사용중인 지오이드 그리드 파일만을 서브 그리드 할 수 있습니다. 그러나 어떤 지오이드 파일이라도 내보내기는 수행할 수 있습니다.
지오이드 파일을 TDS Survey Pro (CE)로	지오이드 그리드 파일을 TDS Survey Pro (CE)를 사용하는 장치로 내보냅니다.  작업 영역을 선택할 수 있습니다. 이는 전송되는 지오이드 그리드 파일의 크기를 축소합니다.
NGS 블루 북 파일	B, G 및 SERFIL 파일. NGS 블루북 포맷은 전국 제어망(national control network)에 삽입하기 위해서 US National Geodetic Survey에 GPS 기선을 전송하는 데 주로 사용합니다.
Pcode 파일을 3600/5600 GDM (*pco)으로	pcode 파일을 3600/5600 GDM으로 내보냅니다.
Trimble Data Exchange 포맷	사용자의 Trimble Geomatics Office 프로젝트로부터의 측량 데이터. 이 포맷은 Trimble Geomatics Office 프로젝트 간에 측량 데이터를 복사하는 데 사용합니다. 이 포맷은 주로 데이터를 제3자 망조정 소프트웨어 패키지로 내보낼 때 사용합니다. 이 포맷은 Trimble사에서 정의한 것으로, 스테이션, 좌표, 처리된 GPS 벡터, 비GPS관측치, 레이저 관측치, 레벨 및 방위각 정보 등을 포함하는 ASCII 파일을 만들어 내는 데 사용합니다. 이 포맷을 지원하는지 여부를 확인하려면 사용자의 망조정 소프트웨어 공급자에게 문의하시기 바랍니다.
SDR 파일 (*.sdr)	설정된 버전으로 현재의 프로젝트를 사용하는 .sdr 파일.   설정을 변경하려면 [옵션]을 클릭합니다.
STAR*NET 2D 기준점	STAR*NET 2D 포맷의 기준점. X 좌표/Y 좌표의 등급이 기준급인 데이터 베이스 포인트 만 내보내기 작업을 할 수 있습니다. 표고의 등급은 어느 것이라도 상관 없습니다.  STAR*NET 패키지로 작업할 경우, 기준점과 관측치 파일을 적절한 텍스트 편집기를 사용하여 하나의 단일 파일로 만드는 것이 가장 좋습니다.
STAR*NET 3D 기준점	STAR*NET 3D 포맷의 기준점. X 좌표/Y 좌표의 등급이 기준급인 데이터 베이스 포인트, 그리고 기준등급의 표고 만 내보내기 작업을 할 수 있습니다.  STAR*NET 패키지로 작업할 경우, 기준점과 관측치 파일을 적절한 텍스트 편집기를 사용하여 하나의 단일 파일로 만드는 것이 가장 좋습니다.
STAR*NET 관측치	STAR*NET 관측치 포맷으로 된 프로젝트 데이터베이스 내의 모든 광파 관측치. STAR*NET 패키지로 작업할 경우, 기준점과 관측치 파일을 적절한 텍스트 편집기를 사용하여 하나의 단일 파일로 만드는 것이 가장 좋습니다.
측량 장치	지원되는 토탈 스테이션, 장치, 측량 데이터 카드 및 GPS 수신기로 직접 전송하는 데이터.
Survey Controller 파일(*.dc)	설정된 버전으로 현재의 프로젝트를 사용하는 .dc 파일. 설정을 변경하려면 옵션을 클릭합니다.
Trimble 3300 / 3600 /5600 Elta M5 파일	Trimble 3300 / 3600 /5600 Elta M5 파일
Trimble 3600/5600 GDM 파일 (*.are)	Trimble 3600/5600 GDM 영역 파일
Trimble Elta GPS Controller M5 파일 (*.dat)	Trimble Elta GPS Controller M5 좌표 파일
TDS Survey Pro (CE) 작업 파일 (*.job)	작업 파일을 TDS Survey Pro CE 장치로
Trimble 3600/5600 TDS 좌표 파일 (*.cr5)	좌표 파일을 Trimble 3600/5600 TDS 장치로
Trimble Data Exchange 포맷 파일 (*.asc)	TDEF 파일


CAD / ASCII 내보내기 포맷

 개요 및 추가 정보

다양한 ASCII 와 CAD 포맷으로 데이터를 내보낼 경우 [CAD/ASCII] 탭을 이용합니다.

이 탭을 이용하려면,

1.	[파일 / 내보내기] 를 선택합니다.

2.	[CAD/ASCII] 탭을 선택합니다.

사용자 포맷을 이 탭으로 이동할 수 있습니다. 자세한 정보는 Asciiexp.dat 파일을 보십시오.

참조: ASCII 파일을 출력하는 내보내기 포맷은 항상 표준화된 형식 (1000자리수 구분 기호 및 소수점이 없는 것)으로 숫자 데이터를 출력합니다. [송출 데이터 단위] 목록을 사용하여 단위를 변경하지 않는 이상, ASCII 파일의 출력 값은 시스템의 화면에 현재 사용되는 것과 동일한 단위를 사용합니다. 시스템의 화면 표시 단위를 변경하려면 [파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 열리면 단위와 포맷 탭을 선택합니다.

[CAD / ASCII] 탭은 다음과 같은 옵션을 가지고 있습니다.

옵션	내보내는 내용...
AutoCAD 파일(*.dxf, *.dwg)	AutoCAD용 Drawing exchange 또는 Drawing 파일.  데이터 포맷, 버전, 프로토 타입 제도를 설정하려면 옵션을 클릭합니다.
C&G 표준 포맷	C&G 소프트웨어의 표준 ASCII 포맷 파일
인용부가 없는 C&G	인용부가 없는 C&G 소프트웨어 ASCII 포맷 파일
CMM 파일 (*.cor, *.lev)	Bureaux of Land Management에서 쓰는 표준 ASCII 포맷 파일. CMM 파일 (*.cor, *.lev) 옵션은 외부 내보내기 필터를 사용하여 제공합니다.
DC 파일 속성 비고 (Survey Controller V4)	콜론(:) 분리기호를 가진 값이 있는 속성을 포함하는 Trimble Survey Controller 버전 4 .dc 파일. 피쳐 및 속성 라이브러리를 이용하여 수집한 속성은 이 포맷으로 내보내어지지 않습니다.
Pacsoft 포맷	Pacsoft ASCII 포맷 파일
SDMS 포맷	AASHTO의 Survey Data Management System 포맷으로 된 데이터
SDRmap 좌표	SDRmap 좌표 파일
Autodesk 야장 파일 (*.fbk)	Autodesk 의 '야장' 포맷으로 된 파일
TERRAMODEL � P,N,E,Z,20D � 파일 (*.pts)	간단한 콤마 구분형 포맷 파일
TPLAN (LLHE)	Trimble GPSurvey ASCII 포맷 파일. 이 옵션으로 WGS-84 위도 및 경도 좌표를 내보낼 수 있습니다.
TRIMMAP 그래픽 파일 (*.tgf)	TRIMMAP (또는 SDRmap) 그래픽 파일
WILDsoft 포맷	WILDsoft ASCII 포맷 파일


내보내기 포맷 - [사용자] 탭

이 탭을 이용하려면:

1.	[파일 / 내보내기]를 선택합니다. [내보내기] 대화 상자가 나타납니다.

2.	[사용자] 탭을 선택합니다.

사용자 정의 포맷을 다른 탭으로 이동할 수 있습니다. 자세한 정보는 Asciiexp.dat 파일을 보십시오.

다음과 같은 경우 [사용자] 탭을 사용합니다.

  사용자 정의 포맷으로 데이터 파일을 가져올 경우

  새 사용자 정의 포맷을 추가할 경우

  기존의 사용자 정의 가져오기 포맷을 수정할 경우

  사용자 정의 가져오기 포맷을 삭제할 경우

다음과 같은 사용자 정의 포맷이 제공됩니다

  구분형 포인트

  고정 너비 포인트

  이름,E,N,표고,코드

  이름,위도,경도,타원체고 (로컬 소수 도)

  이름,위도,경도,타원체고 (WGS-84 소수 도)

  이름,위도,경도,타원체고,코드 (로컬)

  이름,위도,경도,타원체고,코드 (WGS-84)

  이름,N,E,표고,위도,경도,타원체고,코드 (로컬)

  이름,N,E,표고,위도,경도,타원체고,코드 (WGS-84)

  이름,N,E,표고,코드

  도로상의 포인트

  포인트- 측설

  도로- 캐치점

  도로 - 스토리 보드

알파벳순으로 사용자 정의 포맷이 표시됩니다.

참조: ASCII 파일로 보내어지는 값은 항상 1000자리 수 구분기호와 소수기호가 없는 표준화된 형태로 기록됩니다. 마이크로소프트 윈도우의 [제어판 / 국가별 설정 / 숫자] 옵션은 사용되지 않습니다.

모든 사용자 정의 내보내기 포맷은Asciiexp.dat 파일에 기록됩니다.


[피쳐 및 속성 라이브러리 옵션] 대화 상자

Trimble Survey Controller로 내보내기를 할 때 Trimble Survey Controller의 버전을 설정 하려면 이 대화 상자를 이용합니다.

버전

7.00 보다 이전의 버전 선택 시, [피쳐 및 속성 라이브러리 옵션] 대화 상자의 [내보내기 속성] 확인란을 이용할 수 없습니다. 그 이전 버전은 이 속성을 지원하지 않기 때문입니다.


[AutoCAD 내보내기 옵션] 대화 상자

AutoCAD로 내보내기를 할 때 AutoCAD의 버전을 설정 하려면 이 대화 상자를 이용합니다.

데이터 포맷

데이터 출력 포맷을 다음 중에서 선택합니다.

  DWG (2진 AutoCAD drawing 파일)

  ASCII DXF (표준 AutoCAD Data eXchange 파일)

  2진 DXF (2진 포맷의 표준 AutoCAD Data eXchange 파일)

참조: 데이터 포맷은 사용자 (또는 사용자의 고객)의 요구에 따라 결정됩니다.

버전

내보내기 파일에 맞는 AutoCAD 버전을 선택합니다. 이것은 내보내려는 파일의 목적지가 되는 시스템에 의해 결정됩니다.

프로토타입 제도

이 필드는 AutoCAD 프로토타입 제도를 선택하기위해 사용합니다. 시스템이 생성하는*.dxf 및 *.dwg 파일에 사용되는 블럭 정의를 이 프로토타입 제도로부터 물려 받게 됩니다.

Trimble Geomatics Office가 AutoCAD 파일을 생성합니다. 이 때,  프로젝트에 사용된 심벌의 이름과 지정된 프로토타입 제도 내에 정의된 블록을 상호 일치시키려 합니다. 심벌 이름에 있는 스페이스는 AutoCAD 블럭 이름에 있는 밑줄과 일치 시킵니다.

심벌 이름이 프로토타입 제도의 블럭 이름과 일치 할 때, 필요로 하는 축척과 회전값과 함께 해당 블럭이 내보내기 파일 내에 삽입됩니다. 프로토타입 제도의 블럭과 일치하지 않는 심벌은 포인트로서 삽입됩니다. 제공되는 프로토타입 제도(Symbols.dxf)에는 시스템과 함께 제공되는 모든 기본 심벌에 대한 블럭 정의가 포함되어 있습니다.

참조: 프로토타입 제도에서 블럭 정의는200 단위X 200 단위로 해석됩니다. 여기서 단위는 내보내기 할 때의 표시 단위입니다. 200 X 200 정의는 Trimble Symbol Editor 유틸리티 및 Trimble Line Type Editor 유틸리티에 의해 사용되는 그리드와 일치해야 합니다. 사용자 고유의 블럭 정의를 가지는 프로토타입 제도를 생성코자 할 경우 심벌의 올바른 축척을 얻기 위해 블럭이 200 X 200 정의에 기초를 두고 있는 지를 확인합니다.

찾아보기

사용자의 시스템을 검색하거나 필요한 AutoCAD 파일을 찾을 때 [찾아보기]를 클릭합니다.


[ASCII 내보내기 포맷 정의] 대화 상자

ASCII 내보내기 포맷을 정의하려면 이 대화 상자를 이용합니다.

이름

내보내기 포맷의 이름을 입력합니다. [내보내기] 대화 상자의 [사용자 정의] 탭 상의 형식 목록에 해당 이름이 나타납니다. 중복되는 이름은 사용할 수 없습니다.

공백값 스트링

내보내기 포맷 정의에 공백값 문자를 입력합니다. 이 필드는 선택 사항 입니다. Trimble Geomatics Office는 할당된 값이 없는 데이터베이스 필드를 발견할 때 마다, 파일 포맷 내에 지정된 공백값 문자를 출력합니다.

참조: 파일 형식에 따라서는 "99999.99", "*****" , 혹은 그와 유사한 특별한 문자열을 요구할 수도 있습니다. 이 설정을 변경하여 Trimble Geomatics Office에서 사용자의 설정 값을 사용하게 할 수 있습니다.

설명

내보내기 포맷의 설명을 입력합니다. 입력한 내용이 상태 표시줄에 나타납니다. 이 필드는 선택 사항입니다.

기본 확장자

내보내기 포맷을 위한 .dat 혹은 .fbk 와 같은 기본 확장자를 입력합니다. 이 필드는 선택 사항으로서 입력하지 않았을 경우 ".txt" 로 간주됩니다.

참조:Trimble Geomatics Office는 [다른 이름으로 저장] 대화 상자에 있는 [파일 형식] 필드에서 확장자를 지정합니다. [파일 이름] 필드에 새 파일의 이름을 입력할 수 있습니다. 선택한 폴더에 해당 파일 확장자를 가지는 파일이 표시됨으로 필요 시 덮어 쓸 수 있습니다. Trimble Geomatics Office는 자동적으로 확장자에 점이 있는 것으로 간주합니다.

내보낼 대상

내보내기 파일의 원본(source)으로 기본 테이블이나 질의(query) 중 한가지를 선택합니다. 기본값이 되는 원본은 [포인트 정보]입니다. 이를 이용해 포인트 테이블에 있는 어떠한 정보라도 내보내기를 할 수 있습니다.

포맷 자동 구성

헤더와 본문을 자동으로 초기화 시키려면 이 단추를 클릭합니다. 자세한 정보는 포맷 자동 구성을 보십시오.

포맷 헤더

텍스트, 필드 코드 정의, 혹은 두 가지 모두를 바로 가기 메뉴에서 입력합니다. Trimble Geomatics Office는 이 것을 이용하여 내보내기 파일의 초기 고정 부분을 생성합니다. 이 필드는 선택 사항입니다.

시스템에서 이용 가능한 모든 필드 코드에 대한 자세한 사항은 필드 코드 - 개요를 보십시오.

헤더 정의에 빈 줄을 삽입하려면 Enter키를 누르십시오.

포맷 본문

Trimble Geomatics Office가 데이터베이스로부터 내보내려는 데이터를 표시하기 위해 해당 필드 코드 정의를 바로 가기 메뉴에서 입력합니다. 이 필드에 출력 정의를 반드시 입력하여야 합니다. 단일 개체의 데이터를 여러 줄에 걸쳐 내보내기를 하려면 정의를 사용합니다. Enter키를 눌러 새로운 정의 열을 생성시킴으로써 이 작업을 할 수 있습니다.

참조: 시스템에서 이용 가능한 필드코드에 대한 자세한 정보는 필드 코드 -  개요을를 보십시오.

포맷 바닥글

바로가기 메뉴에서 텍스트, 필드 코드 정의, 혹은 두 가지 모두 입력합니다. Trimble Geomatics Office는 이것을 이용하여 내보내기 파일의 마지막 고정 부분을 생성합니다. 이 필드는 선택 사항입니다.

시스템에서 이용 가능한 필드코드에 대한 자세한 정보는 필드 코드 -  개요을를 보십시오.

바닥글 정의에 빈 줄을 삽입하려면 Enter키를 누르십시오.

사용자 정의 ASCII 내보내기의 예는 ASCII 내보내기 포맷 정의 - 예를 보십시오.


ASCII 내보내기 포맷 정의 - 예
ASCII 내보내기 포맷 정의 − 예

 기타

이 예는 프로젝트가 다음과 같은 포인트를 가지고 있다고 가정하고 ASCII 내보내기 포맷 작성 방법을 보여줍니다.

이름: 1000	E: 534247.541	N: 263104.807	표고: 10.118	코드: STN

이름: 1024	E: 534220.249	N: 263104.249	표고: 10.129	코드: MH

이름: 1025	Et: 534222.850	N: 263100.894	표고: 10.133	코드: TREE

이름: 1026	Et: 534222.218	N: 263095.934	표고: 10.136	코드: TREE

이름: 1027	Et: 534224.816	N: 263092.579	표고: 10.140	코드: POLE

이름: 1028	Et: 534228.398	N: 263089.101	표고: 10.732	코드: FENCE

이름: 1041	Et: 534236.948	N: 263084.989	표고: 11.054	코드: FENCE

이름: 1042	Et: 534237.326	N: 263087.964	표고: 10.982	코드: FENCE

이름: 1087	Et: 534243.575	N: 263099.773	표고: 10.154	코드: MH

예 1

내보내기 포맷:

포맷 헤더:

파일 포맷 버전 1.50

일자: [$시스템.날짜]

프로젝트: [$프로젝트.이름]

포맷 본문:

[이름],[Y 좌표.3],[X 좌표:0.3],[표고:0.3],[피처 코드]

포맷 바닥글:

[$시스템.정보]

이 포맷 본문은 다음과 같은 내보내기 파일을 생성합니다 (적당한 날짜, 마이크로소프트 윈도우 데이터 포맷 설정과 프로젝트 이름을 가정).

파일 포맷 버전 1.50

날짜: 8/11/96

프로젝트: 예

1000,534247.541,263104.807,10.118,STN

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,TREE

1026,534222.218,263095.934,10.136,TREE

1027,534224.816,263092.579,10.140,POLE

1028,534228.398,263089.101,10.732,FENCE

1041,534236.948,263084.989,11.054,FENCE

1042,534237.326,263087.964,10.982,FENCE

1087,534243.575,263099.773,10.154,MH

Trimble Geomatics Office, 버전 1.50

예 2

내보내기 포맷:

포맷 헤더 없음

포맷 본문:

[이름:4][Y 좌표:12.3][X 좌표:12.3][표고:12.3] [피쳐 코드]

이 포맷 본문은 다음과 같은 내보내기 파일을 생성합니다.

1000  534247.541  263104.807      10.118 STN

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 TREE

1026  534222.218  263095.934      10.136 TREE

1027  534224.816  263092.579      10.140 POLE

1028  534228.398  263089.101      10.732 FENCE

1041  534236.948  263084.989      11.054 FENCE

1042  534237.326  263087.964      10.982 FENCE

1087  534243.575  263099.773      10.154 MH

참조: Trimble Geomatics Office는 헤더와 본문의 끝에 새로운 줄이 첨가 되는 것으로 가정합니다. 새로운 줄을 추가하려면 Enter키를 누르십시오. 삽입 포인트가 한 줄 밑으로  내려가서 왼쪽 여백 있는 부분으로 이동함으로써 사용자로 하여금 새로운 텍스트를 입력할 수 있도록 빈 줄을 생성합니다.


SDMS 포맷 옵션

Survey Data Management System (SDMS) 포맷은 American Association of State Highway and Transportation Officials(AASHTO)에 의해 정의된 포맷으로 측량 데이터에 적용되는 특수한 포맷입니다. Trimble Geomatics Office에서 이 포맷으로 데이터를 출력할 수 있습니다.

이 옵션으로 포인트와 그에 따르는 속성 비고를 내보냅니다. 이 비고는 추가 포인트 피쳐를 포함 할 수 있습니다. 측량하는 동안 Trimble Survey Controller를 사용하는 장치에 이 속성 비고를 입력합니다. Trimble Survey Controller의 특수한 속성 비고 기능이 이것을 도와줍니다.  부가적으로, 두 글자 뒤에 콜론이나 스페이스가  있고 다음 속성 내역이 따르는 식별자가 SDMS파일로 내보내어 집니다.

예를 들어 I0: information(또는 I0 information)을 가지는 비고는 SDMS식별자인I0와 연관되어 있는 텍스트가 있는 I0:information로서 SDMS 파일로 내보내어 집니다.

이 속성 비고를 생성된 SDMS 파일의 정확한 포인트와 연결시키려면 내보내기를 하는 동안 선택 집합을 선택 해야 합니다. 이 선택 집합은 Trimble Survey Controller *.dc 파일을 해당 프로젝트 내로 가져올 때 자동으로 생성됩니다. 이 선택 집합은 .dc 파일에서 발견되는 측량 순서대로 모든 데이터 (기록된 비고 포함)를 보관합니다.


[외부] 필터 - 개요
[외부] 필터 − 개요

Trimble Geomatics Office는 외부 가져오기 및 내보내기 필터를 추가할 수 있는 옵션을 제공합니다. 사용자는 본 시스템 프로그램과는 별개인 내보내기 함수들을 가지는 동적 연결 라이브러리(.dll)로서 필터를 작성할 수 있습니다. .dll 파일은 반드시 개체 연결 및 삽입 (Object Linking and Embedding,OLE) 모듈로서 제작되어야만 합니다. 이 모듈들을 Component Object Module (COM) 개체라고 부르기도 합니다.

외부 필터에는 다음의 내보내기 함수가 반드시 제공되어야 합니다.

GetGUID 함수

파스칼 함수 선언:	함수 GetGUID: TGUID; stdcall; 내보내기;

C/C++ 함수 선언:	GUID __stdcall __내보내기GetGUID()

이 함수는 프로그램에 주어진 고유의 구성등급 (component class) OLE 식별자인GUID ( Globally Unique Identifier - 세계 유일의 인식자)를 생성해야  합니다. 이 고유 식별자는 일반적으로 컴퓨터의 시간, 일자, 네트워크 카드 ID, 혹은 그와 유사한 정보에 기초한 고유 식별자를 생성하는 프로그램을 사용하여 생성할 수 있습니다. 그 이론은 다음과 같습니다. 전 세계에서 유일한 ID를 만들기 위해 무작위로 두개의 숫자를 선택하되 확률적으로 같은 숫자가 나오는 것이 불가능할 정도로 많은 자리 수를 가진 숫자 (예를 들어 32자리의 숫자)를  사용함으로 세계에서 유일한 값을 얻는 것입니다. 다음과 같은 GUID의 예를 들 수 있습니다. 07F750A3-594B-11D1-8E4C-0000C04FCAF9

변환 함수

파스칼 함수 선언:	function Convert(const FileName: WideString): WordBool;

C/C++ 함수 선언:	BOOL __stdcall __export Convert(BSTR FileName)

이것은 필터의 실제 작업을 수행하는 함수입니다. 원본 파일의 데이터를 대상 파일에 저장되어 있는 해당 포맷 데이터로 변환할 수 있도록 필터 프로그램을 작성해야 만 합니다. Trimble Geomatics Office는 이 함수를 이용하여 필터가 파일을 생성할 수 있도록 대상 파일 이름을 지정합니다. 가져오기 필터의 경우, Trimble Geomatics Office는 필터가  표준 [파일 / 열기] 대화 상자를 열어 원본 파일을 선택할 수 있도록 해주기를 기대합니다. 시스템이 정의하고 필터 프로그램이 생성하는 대상 파일 이름이 변환 함수를 사용하여 필터로 전달 됩니다. 가져오기 필터 프로그램에 의해 생성된 파일은 유효한 .dc파일 포맷으로 되어 있어야 합니다 (Survey Controller 또는 SDR 파일 포맷).

내보내기 필터의 경우, Trimble Geomatics Office는 필터가  표준 [파일 / 저장] 대화 상자를 열어 대상 파일을 선택할 수 있도록 해주기를 기대합니다. Trimble Geomatics Office는 아래에 설명한 포맷 함수에 정의되어 있는 파일 포맷에 따라 필터를 위한 원본 파일을 작성합니다. 원본 파일의 파일 이름이 변환 함수에 전달됨으로써 필터가 어떤 파일을 사용해야 하는 지를 알게 해줍니다. Trimble Geomatics Office는 내보내기 작업을 위해 정의된 선택 집합 범주에 따라 데이터베이스에서 데이터를 추출합니다. 포맷 함수에 정의 되어 있는 필드 코드 정의는 Trimble Geomatics Office가 원본 파일에 기록하는 데이터 포맷을 제어합니다. 내보내기 필터는 원본 파일을 읽어 데이터를 적당한 내보내기 포맷으로 변환 후 지정된 대상 파일에 기록합니다.

GetLongDesc 함수

Pascal 함수 선언:	function GetLongDesc: WideString; safecall;

C/C++ 함수 선언:	BSTR __stdcall __export GetLongDesc()

이 함수는 [가져오기]나 [내보내기] 대화 상자에서 가져오기 또는 내보내기 필터 옵션을 선택할 때 Trimble Geomatics Office의 상태 표시줄에 표시되는 텍스트를 제공하기 위해 사용합니다. 이 함수의 정의는 선택 사항으로서, 정의되지 않았을 경우에는 필터 옵션을 선택할 때 상태 표시줄에 아무것도 표시되지 않습니다.

GetShortDesc 함수

Pascal 함수 선언:	function GetShortDesc: WideString; safecall;

C/C++ 함수 선언:	BSTR __stdcall __export GetShortDesc()

이 함수는 Trimble Geomatics Office에서 필터를 선택할 수 있도록 해주는 [가져오기]나 [내보내기] 대화 상자에 표시되는 가져오기 또는 내보내기 필터 이름의 텍스트를 제공하는데 사용합니다.

Format 함수

Pascal 함수 선언:	function Format: WideString; safecall;

C/C++ 함수 선언:	BSTR __stdcall __export Format()

이 함수는 내보내기 필터 프로그램에서만 필요하고, Trimble Geomatics Office가 생성할 원본 파일의 포맷을 프로그램이 지정할 수 있게 해 줍니다. 이 함수에 의해 생성되는 문자 열은 유효한 Trimble Geomatics Office 필드 코드로 구성되어 있어야 만 합니다. 내보내기 필터 프로그램에 포맷 함수가 정의되어 있지 않을 경우, Trimble Geomatics Office는 '[이름],[X 좌표],[Y 좌표],[표고],[피쳐 코드]' 의 포맷을 취해, 내보내기 필터에 의해 읽혀질 수 있는 콤마로 분리된 이름, X 좌표, Y 좌표, 표고, 피쳐 코드 값의 파일을 생성합니다.


GPS 데이터 파일 (*.dat) 옵션

.dat 파일은 GPS 수신기에서 받은 GPS 원시 데이터를 가지고 있습니다. 이 파일은 후처리 kinematic 데이터와 static 데이터를 포함할 수 있습니다. GPS .dat 파일은 어떠한 좌표계 정보도 포함하고 있지 않습니다.

다음으로부터 Trimble Geomatic Office 프로젝트로 .dat 파일을 이동할 수 있습니다.

  Trimble Survey Controller (.dc 파일을 가짐)

  Trimble Survey GPS 수신기

  컴퓨터

참조: .dat 파일을 동일 프로젝트에 두 번 이상 가져올 경우, [DAT 체크인] 대화 상자에서 프로젝트 데이터베이스의 기존 선점이 기본값으로 선택 되지 않습니다.


[RINEX 파일] 옵션
RINEX 파일 옵션

RINEX (Receiver INdependent Exchange 포맷)는 복수의 수신기 제조회사로부터 파일을 교환함에 쓰는 표준 GPS 원시 데이터 파일 포맷입니다.

이 포맷을 사용하려면 컴퓨터 상에 다음과 같은 파일이 필요 합니다.

RINEX 파일	파일 확장자	선택 사항
관측 데이터 파일	*.obs, *.Xxo	−
항법 메시지 파일	*.nav, *.XXn	−
기상 파일	*.met 또는 *.XXm 파일	이 파일은 선택 사항입니다.
컴퓨터 상의 RINEX 파일을 Trimble Geomatics Office로 가져오려면  다음 중의 한가지를 실행합니다:

  [가져오기] 대화 상자를 사용하여 RINEX 파일 (*.obs, *.Xxo)을 선택합니다.

  '끌어다 놓기' 기능을 이용합니다.

관측 데이터 파일을 선택합니다. 관측 파일과 항법 파일이 동일한 이름을 가지고 있지 않을 경우에는 [항법 파일 부합 검사] 대화 상자에서 관측 파일과 항법 파일을 일치 시킬 수 있습니다. 일치하는 .nav 파일을 찾아가거나 항법 파일 목록에서 선택합니다

[DAT 체크인] 대화 상자가 나타나면 사용자는GPS 관측치를 가져오기 전에 파일의 값을 점검할 수 있습니다. 안테나와 수신기 형식이 "미지"로 되어있지 않도록 해야 합니다.

프로젝트 데이터베이스에 RINEX 파일이 전달되고 모든 GPS 관측치가 들어오면, RINEX 파일과 동일한 이름의 선택 집합이 생성됩니다.

Trimble Geomatics Office 프로젝트에 RINEX 파일이 들어오면 사용자는 Trimble Geomatics Office를 이용하여 GPS 기선을 처리할 수 있습니다 (기선 처리 모듈이 설치되어 있을 경우). 그리고 Timeline 모듈을 이용하여 원시 GPS 관측치를 볼 수 있습니다 (기선 처리 모듈이 설치되어 있을 경우).


Survey Controller의 포인트 등급부여 및 이 등급이 Trimble Geomatics Office 소프트웨어에서 사용되는 방법
Survey Controller 등급 및 이 등급이 Trimble Geomatics Office에서 처리되는 방법

Trimble Survey Controller에서 포인트가 생성될 때 포인트 등급이 주어집니다. 포인트를 프로젝트로 가져올 때 Trimble Geomatics Office가 이 등급을 사용합니다. Trimble Geomatics Office는 또한 포인트에 질을 부여하기 위하여, 포인터의 위치를 결정하는데 사용한 방법을 사용합니다. 재계산은 이 등급을 사용하여 포인트의 계산된 위치를 결정 합니다.

다음 테이블은 Trimble Survey Controller가 포인터에게 부여하는 등급과, 가져오기 작업을 수행할 때 Trimble Geomatics Office가 이 포인터를 어떻게 처리하는지를 보여줍니다.

등급	설명	가져오기 수행 시 결과
기준급	Trimble Survey Controller 에서 가장 높은 등급	해당 포인트에 대한 기준 좌표로서 가져옵니다.
일반급	모든 측정된 포인트(측설점은 제외)에 부여하는 등급. 키입력된 포인트도 이 등급을 부여할 수 있습니다.	해당 포인트에 대한 좌표와 관측치를 가져옵니다. 좌표는 측량 등급이 부여됩니다
측설급	측설 도중 측정되는 포인트에 부여하는 등급	포인트에 대한 측설 내역과 관측치를 가져옵니다. 등록 정보 창 측설 탭에서 측설 내역을 볼 수 있습니다.
후시급	현장에서 후시점으로 지정된 포인트에 부여하는 등급	후시급은 Trimble Geomatics Office에서 일반급과 동일하게 취급됩니다.
점검급	점검 관측치에 부여하는 등급. 또는 중복 포인트로서 키입력되고 점검점으로 저장된 위치에도 이 등급을 부여	'점검점으로 이용' 등급인 관측치를 가져옵니다.
삭제급	Survey Controller에서 삭제되거나 덮어쓰여진 포인트에 부여하는 등급	삭제급인 포인트는 Trimble Geomatics Office 프로젝트에 가져오지 못합니다. .dc 파일의 삭제된 포인트 목록은 파일 가져오기시 생성되는 보고서에 나옵니다.


Survey Controller 등급을 사용하여 .dc 파일의 좌표와 관측치에 질(質) 할당
Survey Controller 등급을 사용하여 .dc 파일의 좌표와 관측치에 질 할당

Trimble Survey Controller에 GPS 위치를 저장할 때 이 GPS 위치는 여러 가지 상이한 측정 기술에 의해,  또는 키로 좌표를 입력함으로 얻을 수 있습니다. 이 포인트에 주어지는 질은 관측 방법이나 키로 입력할 때 포인터에 부여하는 질에 따라 달라집니다.

다음 테이블은 Trimble Survey Controller 등급을 사용하여 좌표에 할당한 질을 보여주고 있습니다.

좌표 방법	할당된 질
키 입력 기준	기준
키 입력 일반	측량
RTK 고정	측량
RTK 유동	매핑
L1 코드	매핑
단독 측위	미지
WAAS	매핑
Wide area 고정	측량
Wide area 유동	매핑
RTCM 코드	매핑
복사	복사된 포인트의 질
참조: Trimble Survey Controller .dc 파일 버전 7.5 이상에서, 베이스의 위치를 결정하기 위해 [여기] 키를 사용했을 때 단독 측위 방법이 사용되고 미지 등급을 가진 좌표를 가져옵니다. 이것은 베이스로부터 측정된 모든 포인트가 미지 등급을 가진다는 것을 의미합니다.

GPS 사이트 캘리브레이션을 수행하였고 그 결과가 확실하다고 생각되면 베이스의 질을 측량 등급으로 증가 시킬 수 있고 베이스에서 측정한 모든 포인트에 이 질을 할당하게 됩니다.

버전 7.5 이전의Trimble Survey Controller .dc 파일에서 베이스의 위치를 결정하기 위해 [여기(Here)] 키를 사용하면 베이스 위치의 질이 측량 등급이 됩니다.

다음 테이블은 Trimble Survey Controller 등급을 사용하여 관측치에 할당한 질을 보여주고 있습니다.

관측 방법	할당된 질
광파	측량
레이저 거리계	매핑
L1 고정	측량
L1 유동	매핑
L1 코드	매핑


Leica GSI-16 파일 가져오기

Leica GSI-16 포맷 파일을 가져올 때 Trimble Geomatics Office는 [측정] 블럭과 이 블럭에 연결된 [설명]문 만을 읽습니다. 가져오기 작업은 스테이션 정보에서 이용 가능한 특정의 [단어] (레코드)를 사용합니다. 가져오기 작업 중 다음과 같은 [단어 색인]을 읽거나 해석합니다.

색인	의미	색인	의미
11	포인트 Id (측정 블럭 식별자)	82	포인트 X 좌표
21	수평각	83	포인트 표고
22	수직각	84	스테이션 Y 좌표
31	사거리	85	스테이션 X 좌표
32	수평 거리	86	스테이션 표고
33	수직 거리	87	반사경 고
71�79	비고 단어 (코드와 비고에 사용)	88	기계고
81	포인트 Y 좌표
이 [단어 색인]에 기초하여, 사용자의 Leica 측량기에 다음과 같은 스테이션 데이터와 측정 데이터 기록 임계를 설정할 것을 권고합니다.

스테이션 데이터 임계	측정 데이터 임계
포인트Id (11)	포인트 Id (11)
스테이션 Y 좌표 (84)	수평각 (21)
스테이션 X 좌표 (85)	수직각 (22)
스테이션 표고 (86)	사거리 (31)
기계고 (88)	ppm 및 프리즘 상수 (51)
코드 (71)	반사경 고 (87)
비고 (72)	코드 (71)
	비고 (72)
참조: 가져오기 중 소프트웨어는 스테이션 레코드 뒤에 기록된 첫번째 관측치를 후시점에 대한 관측치로 가정합니다. 첫번째 설명문 (71)은 포인트 코드로 해석하고 다른 설명문 (72�79)은 [비고] 레코드로 해석합니다.


[디지털 레벨 파일 (*.dat, *.raw)] 옵션
'디지털 레벨 파일 (*.dat, *.raw)' 옵션

디지털 레벨 파일은 디지털 레벨에 저장된 데이터를 가지고 있습니다.

다음과 같은 디지털 레벨의 데이터 파일을 지원합니다:

  Trimble DiNi 디지털 레벨

  Leica NA 2002/3003

디지털 레벨 파일을 가져올 때 [디지털 레벨 가져오기] 대화 상자가 나타납니다.

참조: Zeiss DiNi 디지털 레벨로부터의 데이터 파일을 반드시 M5 포맷으로 전송하여야 합니다.


NGS Bluebook 내보내기

Trimble Geomatics Office의 NGS Bluebook 내보내기를 이용하면 National Geodetic Survey(NGS) Bluebook 파일을 만들 수 있습니다.

Bluebook 파일은 미국정부가 정의한 개념으로 National Spatial Reference System에 제출할 측량에 요구됩니다. 이 측량에서 요구되는 요건이 Blue book에 수록되어 있고, 이 요건에 맞는 측량을 제출하는 것을 bluebooking 이라고 합니다.

NGS Bluebook 유틸리티는 GPS 기선을 위해 다음과 같은 bluebook 파일을 생성합니다.

  NGS

  B - 프로젝트 정보

  G - 기선 정보

  SERFIL - 기존 프로젝트의 스테이션 SSN, ID 및 스테이션 이름을 포함하는 ASCII 파일

[NGS Bluebook 파일] 대화 상자는 사용자의 프로젝트에 독립적으로 처리된 기선의 선택 집합과 연계된 데이터를 사용합니다. 모든 현장 작업, 처리, 질 확인은NGS 파일을 내보내기 전에 끝마쳐야 합니다. 일단 기선을 선택하고 내보내기를 초기화하면, 내보내기 과정을 다시 시작하지 않고는 이 Bluebooking 대화 상자에 기선을 추가 할 수 없습니다.

참조: [NGS Bluebook 내보내기] 대화 상자의 각 필드에 필요한 데이터의 설명은 밡ational Geodetic Survey (NGS) 데이터베이스의 입력 포맷 및 규격� 을 참조 합니다. NGS 참고 사항은http://www.ngs.noaa.gov/FGCS/BlueBook/ 에서 이용할 수 있습니다.


[NGS Bluebook 파일] 대화 상자

Trimble Geomatics Office의 NGS Bluebook 내보내기 필터를 사용하면 National Geodetic Survey(NGS) Bluebook 파일을 만들 수 있습니다.

[NGS Bluebook 파일] 대화 상자는 사용자의 프로젝트에 독립적으로 처리된 기선의 선택 집합과 연계된 데이터를 사용합니다. 모든 현장 작업, 처리, 질 확인은NGS 파일을 내보내기 전에 끝마쳐야 합니다. 일단 기선을 선택하고 내보내기를 초기화하면 내보내기 과정을 다시 시작하지 않고는 [NGS Bluebook 파일] 대화 상자에 기선을 추가할 수 없습니다.

[NGS Bluebook 파일] 대화 상자의 기능을 이용하려면

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나타납니다.

2.	[측량] 탭에서 NGS Bluebook 파일을 선택합니다.

참조: 이전에 저장해 놓은  bluebooking 세션이 있을 경우, 저장한 이 정보를 가지고 올 것인지 여부를 묻습니다.

프로젝트에 대한 정보를 입력하려면 [NGS Bluebook 내보내기] 대화 상자의 탭을 사용합니다.

[프로젝트] 탭

이 탭에는 프로젝트에 관한 일반적인 정보가 들어 있습니다.

[스테이션] 탭

이 탭에는 선택된 기선과 관계되는 모든 스테이션의 목록이 들어 있습니다.

  [자동 만들기] 단추를 이용하여 4개 문자로 되어 있는 ID 와 스테이션 SN을 입력합니다. ID는 스테이션 이름의 첫번째 4개의 문자를 사용하여 생성됩니다. SN은 0001 부터 또는 첫번째로 이용 가능한 숫자부터 시작하여 순차적으로 생성됩니다.

  [주/국가 코드] 열은 [프로젝트] 탭의 정보에서 자동으로 입력됩니다.

  목록에서 순서를 선택합니다.

 모든 bluebook 화 된 데이터가 GPS 수집 방법을 사용하므로, [형식] 열은 자동으로 A-Interferometirc Satellite Relative Positioning Main Scheme를 기본값으로 합니다.

 SERFIL을 사용하여 이전 프로젝트로부터 4개의 문자로 되어있는 기존 스테이션 ID와 SN을 가져오려면 [SERFIL] 단추를 사용합니다. SERFIL에는 반드시 각 스테이션의 이름이 있어야 합니다. 이 포맷은NGS SERFIL 포맷과 약간 차이가 있지만 NGS는 아직 이 파일을 사용할 수 있습니다. 반드시 다음과 같은 포맷을 사용하여야 합니다:

4 문자 ID   스테이션 SN    스테이션 이름

COWB   0004   COWBOY

[세션 정보] 탭

이 탭은 선택된 기선의 각 필드 세션에 대한 정보를 포함하고 있습니다. 번갈아 바뀌는 색은 독립적인 각 기선 세션을 나타냅니다.

  [시작 시간]은 모든 수신기의 가장 최근 시작 시간을 세션에 나타내지만, 각 기선의 시작 시간을 표시하지는 않을 수 있습니다. 이 시간은 세션을 현장 시트와 일치시킬 때 기준 값으로만 사용해야 합니다.

  수신기 종류와 일련 번호가 [수신기] 열에 자동으로 입력됩니다.

 안테나 종류가 [안테나] 열에 자동 입력되지만, 일련 번호는 반드시 수동으로 입력해야 합니다. 각 안테나 일련 번호를 한번 입력한 후부터는 드롭 다운 목록에서 이를 선택할 수 있습니다.

  L1 페이즈 센터에 대한 실제적인 수직 측정값이 [안테나 높이] (미터/APC L1) 열에 자동으로 입력됩니다. 이 수직 측정값은 필드에서 입력한 안테나 높이로부터 계산되거나 체크인(check in) 하는 도중에 계산 됩니다.

[전 세션 기상] 과 [후 세션 기상] 탭

[전 세션 기상] 및 [후 세션  기상] 탭에는 선택된 기선과 연관되는 각 선점에 대한 기상 정보가 있습니다. 이 필드는 �B� order 또는 그 이상의 측량을 수행할 때 필요합니다. 별표(*)는 [프로젝트] 탭에서 1st Order 측량을 선택했을 때 탭 헤더에서 자동적으로 제거 됩니다.

필드	기본값
건구	섭씨
습구	섭씨
습도	퍼센트
기압	밀리바 (Millibar) 단위
  [기상 코드] 필드는 코드를 직접 입력하거나 [현재 필드 편집] 단추를 사용하여 입력할 수 있습니다.

  [현재 필드 편집] 단추를 이용하면 각 변수의 설명에서 코드를 보고 선택할 수 있습니다.

  [전 (후) 세션 기상으로 복사] 필드는 [전 세션 기상] 탭에서 [후 세션 기상] 탭으로 동일한 데이터를 복사하거나 혹은 그 반대 방향으로 복사하는데 사용됩니다.

[기타] 탭

[기타] 탭에는 처리에 대한 일반 정보가 있습니다.

장비

[장비] 단추를 사용하면 각 수신기와 안테나에 대한 정보를 보거나, 추가, 수정할 수 있습니다. 프로젝트와 연계 되어 있는 장비만 목록에 나타납니다.

확인

[확인] 단추는 [NGS Bluebook 필터] 대화 상자를 닫고 각 탭의 정보를 저장하는데 사용합니다. 많은 양의 데이터를 입력할 때 작업을 저장 후 나중에 다시 불러올 수 있습니다.

내보내기

필요한 모든 필드를 작성한 후 [내보내기]  단추를 이용할 수 있습니다. [내보내기] 단추는 사용자로 하여금 각 파일의 이름을 입력하고 위치를 선택할 수 있게 해줍니다. 기본 위치는 Trimble Geomatics Office\Projects\<프로젝트 이름>\Export입니다.

참조: 각 탭의 필요한 필드 작성을 완료하면, 이름 옆에 붙어 있는 별표(*) 가 제거됩니다. 대화 상자에 입력할 필드가 더 이상 없으면 [내보내기] 단추가 이용할 수 있는 상태로 변화합니다.

참조: [NGS Bluebook 내보내기] 대화 상자의 각 필드에 필요한 데이터의 설명은 밒nput Formats and Specifications of the National Geodetic Survey (NGS) Data Base� 을 참조 합니다. NGS 참고 사항은: http://www.ngs.noaa.gov/FGCS/BlueBook/ 에서 이용할 수 있습니다.


[Trimble Data Exchange] 포맷
Trimble Data Exchange 포맷

 방법

이 포맷은 다음 작업을 실행할 수 있도록Trimble Navigation Limited에 의해서 고안되었습니다.

  Trimble Geomatics Office 프로젝트 간의 측량 데이터 전송

  망조정 또는 다른 측지 작업을 위하여 다른 응용 프로그램으로 측량 데이터의 송출

참조: 망 조정 소프트웨어 공급자가 이 포맷을 지원하는지 확인해야 합니다.

이 포맷을 사용하여 데이터를 가져오거나 내보내려면 [가져오기] 또는  [내보내기] 대화 상자의 'Trimble Data Exchange 포맷' 옵션을 선택합니다.

ASCII 파일에 다음과 같은 정보가 저장됩니다:

스테이션 및 좌표	GPS 벡터
비 GPS 관측치	레이저 관측치
레벨 정보	방위각 정보
파일은 다음과 같은 섹션으로 구성되어 있습니다.:

[일반]

이 섹션은 파일 내용 및 그 파일 내용을 가져온 프로젝트 그리고 여러 가지 필드에 사용되는 단위에 대한 일반적인 정보를 제공합니다.

[스테이션]

이 섹션은 전송하려고 선택한 모든 포인트의 이름과 좌표를 포함합니다. 이 섹션의 좌표는 항상 로컬 데이터로 되어 있습니다. 위도, 경도, X 좌표 및 Y 좌표를 포함하는 스테이션 레코드에 각 관측치가 들어 있습니다. 타원체고 및 정표고가 또한 각 레코드에 나타날 수도 있습니다.

이 스테이션 레코드는 또한 어떤 좌표 요소가 기준으로 인식 되는지에 대한 정보와 스테이션에 할당 되어 있는 피쳐 코드에 대한 정보를 포함하고 있습니다.

[GPS]

이 섹션은 전송을 위해 선택한 GPS 벡터 기선을 포함하고 있습니다. 벡터 레코드에 각 관측치가 있으며 다음과 같은 것을 포함하고 있습니다.

스테이션 이름	벡터 요소
공분산 정보	안테나 높이
처리 형식	비율
RMS	기준 분산
관측 일시
[비 GPS]

이 섹션은 전송을 위해서 선택한 비 GPS 관측치를 포함하고 있습니다. [TerrObs] 레코드에 각 관측치가 있으며, 다음과 같은 것을 포함하고 있습니다.

기계점	후시점
전시점	수평각 및 오차
수직각 및 오차	사거리 및 오차
프리즘 상수	기계고
관측 일시 (해당이 될 경우)	타겟 높이
[레이저]

이 섹션은  전송하기 위해 선택한 레이저 관측치를 포함하고 있습니다. [LaserObs] 레코드에 각 관측치가 있으며, 다음과 같은 것을 포함하고 있습니다:

기계점	자기 편각
자기 방위각	사거리
수직각	타겟 높이
기계고	타겟점
관측 일시 (해당이 될 경우)
 [레벨]

이 섹션은  전송하기 위해 선택한 레벨 관측치를 포함하고 있습니다. [LevelObs] 레코드에 각 관측치가 있으며 다음을 포함하고 있습니다.

레벨 런의 시작 및 끝 포인트	델타 표고 및 오차
거리 (해당이 될 경우)	턴 수 (해당이 될 경우)
관측 일시 (해당이 될 경우)
 [방위각]

이 섹션은 방위각 레코드를 포함하고 있으며, 이 레코드에는 각 관측치가 포함되어 있습니다.


Terramodel 프로젝트 파일 (*.pro)

Trimble Geomatics Office는 Terramodel 프로젝트 파일 (*.pro) 포맷을 지원합니다.

Trimble Geomatics Office를 이용하여 Terramodel 프로젝트 파일(*.pro)을 Trimble Geomatics Office 프로젝트에로 가져옵니다.

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[CAD / ASCII] 탭을 선택합니다.

3.	'Terramodel 프로젝트 파일 (*.pro)' 옵션을 선택합니다.

[열기] 대화 상자가 나옵니다.

4.	가져올 파일을 선택하고 [열기]를 클릭합니다.

참조: 포인트, 선작업, 레이어만이 Terramodel 프로젝트 파일(*.pro)로부터 도입됩니다.


TDS 소프트웨어 - 개요
TDS 소프트웨어 − 개요

기타

Trimble Geomatics Office는 다음과 같은 TDS 소프트웨어의 파일을 지원합니다.

  TDS Survey Pro CE

  TDS 3600 탑재

  TDS 5600 탑재

사용자가 TDS 파일을 자신의 PC로부터 가져오고 내보낼 수 있습니다. 또는 이것을 측량 장치 가져오기 및 내보내기 옵션을 써서 TDS 소프트웨어로(부터)  직접 전송할 수도 있습니다.

참조: Trimble Geomatics Office는 TDS 제어 파일을 지원하지 않습니다. 파일 전송 이전에 반드시 제어 파일의 포인트를 메인 작업으로 가져와야만 합니다. 자세한 내용은 TDS 사용 설명서를 참조하십시오.

참조: Trimble Geomatics Office는 TDS 피쳐 및 속성을 지원하지 않습니다.

TDS Survey Pro CE

Trimble Geomatics Office는 TDS Survey Pro CE의 다음 파일을 지원합니다.

이름	확장자	가져오기	내보내기	설명
작업	*.job			포인트 및 좌표 정보를 포함합니다. TDS Survey Pro CE 프로젝트로부터 포인트만 가져오고자 할 때 작업 파일 (*.job)을 가져옵니다.
원시	*.raw		X	관측 정보를 포함합니다. TDS Survey Pro CE 프로젝트로부터 포인트와 관측치를 둘다 가져오고자 할 때 원시 파일 (*.raw)을 가져옵니다.
설명	*.txt	X		피쳐 코드의 간단한 텍스트 파일. TDS Survey Pro CE에서 포인트 설명을 입력하는 데 도움
지오이드 그리드	*.ggf	X		WGS84 기준 타원체로부터의 분리 간격(TDS Survey Pro CE 버전 3.5 이상)

내보내려면:

  RoadLink로부터 도로 정의(*.job, *.rd5, *.tp5) 내보내기는 RoadLink 도움말 참조

  DTMLink 로부터 DTM(*.dtm) 내보내기는 DTMLink 도움말 참조

이 파일들에 대한 자세한 사항은 TDS 사용 설명서를 참조하십시오.

또한Trimble Geomatics Office는 TDS Survey Pro CE 소프트웨어(모든 버전)에 대한 좌표계 지원을 합니다 . Trimble GPS 수신기와 함께 사용시, TDS Survey Pro CE 3.5 이상에서 이용 가능한 고급 측지 기능도 지원합니다. TDS Survey Pro CE로부터 도입된 모든 파일은 Survey Controller (*.dc) 파일의 것과 동일한 완전한 좌표계 정의를 포함합니다.

참조: GPS 관측치는 Trimble GPS 수신기와 함께 사용시 TDS Survey Pro CE 3.5 이상으로부터만 도입됩니다. 어떤 종류의 토탈 스테이션이든 그로부터의 비GPS 관측치는 모든 버전으로부터 지원됩니다.

Trimble 3600/5600 TDS

Trimble Geomatics Office는 Trimble 3600/5600 TDS 소프트웨어의 다음 파일을 지원합니다.

이름	확장자	가져오기	내보내기	설명
좌표	*.cr5			포인트 및 좌표 정보를 포함합니다. Trimble 3600/5600 TDS 프로젝트로부터 포인트만 가져오고자 할 때 좌표 파일 (*.cr5)을 가져옵니다.
원시	*.rw5		X	관측 정보를 포함합니다. Trimble 3600/5600 TDS 프로젝트로부터 포인트와 관측치를 둘다 가져오고자 할 때 원시 파일 (*.raw)을 가져옵니다.
설명	*.txt	X		피쳐 코드의 간단한 텍스트 파일. TDS Survey Pro CE에서 포인트 설명을 입력하는 데 도움

내보내려면:

  RoadLink로부터 도로 정의(*.job, *.rd5, *.tp5) 내보내기는 RoadLink 도움말 참조

  DTMLink 로부터 수치 지형 모델(*.dtm) 내보내기는 DTMLink 도움말 참조

  이 파일들에 대한 자세한 사항은 TDS 사용 설명서를 참조하십시오.

Trimble 3600/5600 TDS 소프트웨어로부터 도입된 파일은 완전한 좌표계 정의를 포함하지 않습니다. 파일은 Survey Controller (*.dc) 파일의 것과 동일한 축척 계수만의 좌표계로써 도입됩니다.

파일 가져오기시, Trimble Geomatics Office는 가장 최근에 TDS Survey Pro CE 작업에서 사용된 축척 계수를 써서 좌표계를 정의합니다.

참조: Trimble 3600/5600 TDS 좌표 파일을 가져올 때, Trimble Geomatics Office는 좌표 파일(*.cr5)을 가져온 다음, 그것이 사용자의 컴퓨터에서 동일한 폴더에 있다면 관련 원시 파일(*.rw5)로부터 데이터를 가져옵니다. 좌표만 가져오고자 하면 그 좌표 파일과 이름이 같은 원시 파일이 사용자의 컴퓨터에서 동일한 폴더에 있지 않도록 합니다. 원시 파일들은 개별적으로 가져올 수도 있습니다.


TDS Survey Pro CE 작업 파일 (*.job)

Trimble Geomatics Office는 TDS Survey Pro CE 작업 파일(*.job) 포맷의 데이터를 지원합니다.

Trimble Geomatics Office를 이용하여:

 TDS Survey Pro CE 작업 파일을 Trimble Geomatics Office 프로젝트에 가져옵니다.

 Trimble Geomatics Office 프로젝트를 TDS Survey Pro CE 작업 파일에로 내보냅니다.

또는 파일을 측량 장치 가져오기 및 내보내기 옵션을 써서 TDS Survey Pro CE 소프트웨어로(부터)  직접 전송할 수도 있습니다.

TDS Survey Pro CE 작업 파일을 가져오려면:

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	'Survey Pro CE 작업 파일 (*.job)' 옵션을 선택하고 [확인]을 클릭합니다.

[열기] 대화 상자가 나옵니다.

4.	가져올 파일을 선택하고 [열기]를 클릭합니다.

참조: TDS Survey Pro CE 작업 파일 포맷은 포인트와 관련 좌표를 포함합니다. TDS Survey Pro CE 프로젝트로부터 포인트만 가져오고자 하는 경우에는 이 옵션을 쓰도록 합니다.

현재 작업중인 Trimble Geomatics Office 프로젝트를 TDS Survey Pro CE 작업 파일로 내보내려면:

1.	[파일 / 내보내기]를 실행합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	'TDS Survey Pro CE 작업 파일 (*.job)' 옵션을 선택하고 [확인]을 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다.

4.	파일을 저장해 둘 폴더를 선택합니다.

5.	[파일 이름] 필드에 이름을 입력하고 [저장]을 클릭합니다.

참조: 내보내고 있는 선택 부분에 중복 포인트가 있다면 TDS Survey Pro CE 작업 파일이 만들어지지 않을 것입니다. 내보내는 모든 포인트의 이름이 하나도 같은 것이 없도록 합니다.


TDS Survey Pro CE 원시 파일 (*.raw)

Trimble Geomatics Office를 이용하여 TDS Survey Pro CE 원시 파일을 Trimble Geomatics Office 프로젝트로 가져옵니다. '측량 장치 가져오기' 옵션으로써 파일을 직접 TDS Survey Pro CE 소프트웨어로부터 전송할 수도 있습니다. TDS Survey Pro CE 원시 파일 포맷에는 Survey Pro CE 프로젝트의 모든 정보가 들어 있습니다 . TDS Survey Pro CE 프로젝트로부터 포인트와 관측치를 둘다 가져오고자 할 때 이 옵션을 씁니다.

TDS Survey Pro CE 원시 파일을 가져오려면:

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	'TDS Survey Pro CE 원시 파일 (*.raw)' 옵션을 선택하고 [확인]을 클릭합니다.

[열기] 대화 상자가 나옵니다.

4.	가져오고자 하는 파일을 폴더로부터 선택하고 [열기]를 클릭합니다.


Trimble 3600/5600 TDS 좌표 파일 (*.cr5)

Trimble Geomatics Office를 이용하여:

 Trimble 3600/5600 TDS 좌표 파일을 Trimble Geomatics Office 프로젝트에 가져옵니다.

 Trimble Geomatics Office 프로젝트를 Trimble 3600/5600 TDS 좌표 파일에 내보냅니다.

사용자가 파일을 측량 장치 가져오기 및 내보내기 옵션을 써서 Trimble 3600/5600 TDS 소프트웨어로(부터) 직접 전송할 수도 있습니다.

Trimble 3600/5600 TDS 좌표 파일을 가져오려면:

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	'Trimble 3600/5600 TDS 파일 (*.cr5)' 옵션을 선택합니다.

[열기] 대화 상자가 나옵니다.

4.	가져올 파일을 선택하고 [열기]를 클릭합니다.

참조: Trimble 3600/5600 TDS 좌표 파일을 가져올 때, Trimble Geomatics Office는 좌표 파일을 가져온 다음, 그것이 사용자의 컴퓨터에서 동일한 폴더에 있다면 관련 원시 파일(*.rw5)로부터 데이터를 가져옵니다. 원시 데이터 파일이 가져올 좌표 파일과 동일한 폴더에 있지 않으면 포인트만 도입됩니다.

현재 작업중인 Trimble Geomatics Office 프로젝트를 Trimble 3600/5600 TDS 좌표 파일로 내보내려면:

1.	[파일 / 내보내기]를 실행합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	'Trimble 3600/5600 TDS 좌표 파일 (*.cr5)' 옵션을 선택합니다.

4.	[확인]을 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다.

5.	파일을 저장해 둘 폴더를 선택합니다.

6.	[파일 이름] 필드에 이름을 입력하고 [저장]을 클릭합니다.

참조: 내보내고 있는 선택 부분에 중복 포인트가 있거나, 포인트의 이름이 문자+숫자로 되어 있으면 Trimble 3600/5600 TDS 좌표 파일이 만들어지지 않을 것입니다. 내보내는 모든 포인트의 이름이 숫자형이고, 하나도 같은 것이 없도록 합니다.


Trimble 3600/5600 TDS 원시 파일 (*.rw5)

Trimble Geomatics Office를 이용하여 Trimble 3600/5600 TDS 원시 파일을 Trimble Geomatics Office 프로젝트로 가져옵니다. '측량 장치 내보내기 및 가져오기' 옵션으로써 파일을 직접 Trimble 3600/5600 TDS 소프트웨어로(부터) 전송할 수도 있습니다. Trimble 3600/5600 TDS 원시 파일 포맷에는 Survey Pro CE 프로젝트의 거의 모든 정보가 들어 있습니다 . Trimble 3600/5600 TDS 프로젝트로부터 포인트와 관측치를 둘다 가져오고자 할 때 이 옵션을 씁니다.

Trimble 3600/5600 TDS 원시 파일을 가져오려면:

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	'Trimble 3600/5600 TDS 원시 파일 (*.cr5)' 옵션을 선택합니다.

[열기] 대화 상자가 나옵니다.

4.	가져올 파일을 선택하고 [열기]를 클릭합니다.


TDS 설명 파일 (*.txt)

TDS Survey Pro CE 및 Trimble 3600/5600 TDS 소프트웨어는 작업에 저장되는 포인트의 설명을 설명 파일을 써서 자동 입력합니다. 설명 파일에 대한 자세한 내용은 TDS 사용 설명서를 참조하십시오.

Trimble Geomatics Office를 이용하여:

 Feature Code Editor로부터 설명 파일(*.txt)을 내보냅니다

 기존의 설명 파일(*.txt)을 TDS Survey Pro CE나 Trimble 3600/5600 TDS 소프트웨어에 내보냅니다.

 설명 파일(*.txt)을 피쳐 코드 라이브러리로부터 TDS Survey Pro CE나 Trimble 3600/5600 TDS 소프트웨어에 내보냅니다.

Feature Code Editor로부터 설명 파일을 내보내려면 Feature Code Editor 도움말을 참조하십시오.

기존의 설명 파일을 TDS Survey Pro CE나 Trimble 3600/5600 TDS 소프트웨어에 내보내려면:

1.	[파일 / 내보내기]를 실행합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	'설명 파일을 TDS 장치로 (*.txt)' 옵션을 선택하고 [확인]을 클릭합니다.

[선택] 대화 상자가 나옵니다.

4.	내보내고자 하는 파일을 선택하고 [열기]를 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다.

5.	TDS 장치를 선택하고 [열기]를 클릭합니다.

해당 파일이 송출됩니다.

새로운 설명 파일(*.txt)을 피쳐 코드 라이브러리로부터 TDS Survey Pro CE나 Trimble 3600/5600 TDS 소프트웨어에 내보내려면:

1.	[파일 / 내보내기]를 실행합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	'피쳐 및 속성 라이브러리를 TDS 장치로 (*.txt)' 옵션을 선택하고 [확인]을 클릭합니다.

[피쳐 및 속성 라이브러리 선택] 대화 상자가 나옵니다.

4.	내보내고자 하는 라이브러리를 선택하고 [확인]을 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다.

5.	TDS 장치를 선택하고 [열기]를 클릭합니다.

해당 파일이 송출됩니다.


Zeiss - 개요
Zeiss − 개요

Trimble Geomatics Office는 다음 Zeiss 측량기로부터의 M5 파일을 지원합니다.

  Trimble 3300

  Trimble 3600 Elta

  Trimble 5600 Elta

  Trimble Elta GPS Controller

  Trimble DiNi 디지털 레벨

PC로부터 M5 파일을 내보내거나 가져올 수 있습니다. 또는 '측량 장치 가져오기 및 내보내기' 옵션을 써서 측량기로(부터) 파일을 직접 전송할 수도 있습니다.

Trimble Geomatics Office에서 지원되는 Zeiss 파일은 다음과 같습니다.

파일 포맷	지원 여부
Elta M5  (영어 및 독일어만)	지원
Rec 500, R4 R5	미지원.  Trimble Geomatics Office CD에는 필요한 경우, M5 및 Rec 500 파일 포맷을 상호 변환하기 위한 프로그램이 들어 있습니다.
Elta 코드 목록	미지원
내보내기

Trimble Geomatics Office는 그리드 점 이름, 코드, 설명, 좌표를 M5 파일에 내보냅니다. 관측치같은 기타 데이터는 내보내지지 않습니다.

참조: 송출 파일에서의 좌표는 Trimble Geomatics Office 프로젝트에서 쓰는 것과 동일한 소숫자리 수로써 기록됩니다. 최대 자릿수는 Trimble 3300 측량기는 소수 세째 자리이고 Trimble 3600/5600 Elta 및 Trimble Elta GPS Controller 측량기는 소수 넷째 자리입니다.

가져오기

참조: M5 파일 포맷은 완전한 좌표계 정의를 지원하지 않습니다. 파일은 축척 만의 좌표계로써 도입되는데 이것은 Survey Controller (*.dc) 파일에서 축척 만의 좌표계를 도입하는 것과 동일합니다. 사용자는 Trimble Geomatics Office에서 도입 좌표계를 정의할 때 축척 계수를 키입력할 수 있습니다.

단위

M5 포맷의 단위는 "m" (미터와 Namibian 미터) 또는 "ft" (International 피트와 US Survey 피트)입니다.

M5 파일으로(부터) 송출/도입시, 프로젝트와 측량기의 사용 단위가 같지 않다면 Trimble Geomatics Office는 M5 파일에서의 "m"는 미터이고, "ft"는 International 피트인 것으로 간주합니다.

Trimble DiNi 디지털 레벨

참조: Trimble Geomatics Office는 Trimble DiNi 디지털 레벨 측량기에로 내보내지 않습니다.

Trimble DiNi 디지털 레벨 측량기로부터의 가져오기와 관련, 자세한 사항은 Digital 디지털 레벨 파일 (*.dat, *.raw) 가져오기 옵션을 참조하십시오.


Trimble 3300/3600/5600 Elta M5 파일 (*.dat)

Trimble Geomatics Office를 이용하여:

 Trimble 3300/3600/5600 Elta M5 파일(*.dat)을 Trimble Geomatics Office 프로젝트에 가져옵니다.

 Trimble Geomatics Office 프로젝트를 Trimble 3300/3600/5600 Elta M5 좌표 파일(*.dat)에 내보냅니다.

사용자가 파일을 측량 장치 가져오기 및 내보내기 옵션을 써서 Trimble 3300이나 3600 Elta, 5600 Elta 탑재 소프트웨어로(부터) 직접 전송할 수도 있습니다.

Elta M5 파일을 가져오거나 내보내기 전에 꼭 Trimble 3300/3600/5600 Elta M5 파일(*.dat)에 대한 M5 파일 옵션을 설정하도록 합니다.

Elta M5 파일(*.dat)을 가져오려면:

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	'Trimble 3300/3600/5600 Elta M5 파일 (*.dat)' 옵션을 선택합니다.

4.	[옵션]을 클릭하여 [M5 파일 옵션] 대화 상자를 불러와 파일을 설정합니다.

5.	설정 내용을 수용하고 [내보내기] 대화 상자로 돌아가려면 [확인]을 클릭합니다.

6.	[확인]을 클릭합니다.

[열기] 대화 상자가 나옵니다.

7.	가져올 파일을 선택하고 [열기]를 클릭합니다.

참조:

 	 M5 파일의 로컬(상대) 좌표(예: "neh" 또는 "xyz")는 가져오기시 절대 좌표로 변환됩니다.

  	 M5 파일을 가져온 후에는 모든 프리즘 상수가 Trimble Geomatics Office에서 "?"로서 나옵니다. 이것을 바꾸려면, 이 필드에 입력된 프리즘 상수와 실제 프리즘 상수와의 차이값을 등록 정보 창의 프리즘 상수 필드에 입력하도록 합니다. 예를 들어, 프리즘 상수로서 �20�을 입력했지만 실제 프리즘 상수가 "5"라면 "�15"를 입력합니다.

  	Trimble Geomatics Office는 직교 측설 델타를 지원하지 않습니다. 이것은 가져오기시 극 측설 델타로 변환됩니다. Trimble 사는 사용자가 측량기를 설정하여 그리드 좌표 측설 델타만 저장하도록 권장합니다.

  	Trimble Geomatics Office는 수평각이 좌측으로 증가하는 것을 지원하지 않습니다. 측량기의 이 설정을 사용하지 마십시오.

측량기 설정

Trimble 3600/5600 Elta 측량기로부터 평균 정반위 관측치를 가져올 때, 꼭 '단일 값'만 저장하게 측량기를 설정하도록 합니다. 만일 '단일 값'과 '평균'을 둘다 선택하면 Trimble Geomatics Office는 부정확한 값을 계산하게 됩니다. 또한, '평균'만 선택한다면 Trimble Geomatics Office는 평균 관측치를 정위 관측치로서 표시합니다.

Trimble Geomatics Office는 Trimble 3600/5600 Elta 측량기에서 항상 대기 보정 기능이 켜져 있다고 가정합니다. 측량기에서 이 보정 기능을 꺼두지 마십시오.

계산 작업에 쓸 좌표와 관측 데이터를 둘다 확보하기 위하여 Trimble 3600/5600 Elta 측량기에서는 R-MC 저장 옵션을(가능한 경우), Trimble 3300 측량기에서는 MEM/3 저장을 반드시 사용하여야 합니다.

스테이셔닝

Trimble Geomatics Office가 측정 전에 데이터를 정확히 해석하도록 하기 위하여 항상 측량기의 스테이셔닝 루틴을 수행하십시오.

스테이션 설정으로부터 삭제된 후시 레코드도 여전히 Trimble Geomatics Office로 도입됩니다. 등록 정보 창을 통하여 이 관측치들을 이용 해제하시기 바랍니다.

Trimble Geomatics Office는 복수 후시를 지원하지 않습니다. 복수 후시점들이 스테이셔닝 루틴에서 측정될 때 Trimble Geomatics Office는 그 마지막 포인트를 후시로 사용하게 됩니다.

미지원 Elta 루틴

다음의 Elta 측량기 루틴은 Trimble Geomatics Office에서 지원되지 않는 특수 데이터를 산출합니다. 그래도 Trimble Geomatics Office는 대부분의 경우 이 루틴으로부터 관측치를 도입하게 됩니다.

  수직 평면(Vertical Plane)

  면적(Area)

  연결 거리(Connecting Distances)

  변환(Transformations)

  Roadline Lite

  복수 라운드(Multiple Rounds)

  3D 면(3D Plane)

현재 작업 중인 Trimble Geomatics Office 프로젝트를 Elta M5 파일(*.dat)에 내보내려면:

1.	[파일 / 내보내기]를 실행합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	'Trimble 3300/3600/5600 Elta M5 파일 (*.dat)' 옵션을 하이라이트합니다.

4.	[옵션]을 클릭하여 [M5 파일 옵션] 대화 상자를 불러와 파일을 설정합니다.

5.	설정 내용을 수용하고 [내보내기] 대화 상자로 돌아가려면 [확인]을 클릭합니다.

6.	[확인]을 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다.

7.	파일을 저장해 둘 폴더를 선택합니다.

8.	[파일 이름] 필드에 이름을 입력하고 [저장]을 클릭합니다.


Trimble Elta GPS Controller M5 파일 (*.dat)

Trimble Geomatics Office에서 다음을 수행할 수 있습니다.

 Elta GPS Controller M5파일을 Trimble Geomatics Office 프로젝트에 가져오기

 Trimble Geomatics Office 프로젝트로부터 Elta GPS Controller M5 좌표 파일에 내보내기

사용자가 파일을 측량 장치 가져오기 및 내보내기 옵션으로써 Trimble Elta GPS Controller 소프트웨어로(부터) 직접 전송할 수도 있습니다.

Elta GPS Controller M5 파일을 가져오거나 내보내기 전에 꼭 Trimble Elta GPS Controller M5 파일에 대한 M5 파일 옵션을 설정하도록 합니다.

Elta GPS Controller M5 파일을 가져오려면:

1.	[파일 / 가져오기]를 실행합니다.

[가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	'Trimble Elta GPS Controller M5 파일 (*.dat)' 옵션을 선택합니다.

4.	[옵션]을 클릭하여 [M5 파일 옵션] 대화 상자를 불러와 파일을 설정합니다.

5.	설정 내용을 수용하고 [가져오기] 대화 상자로 돌아가려면 [확인]을 클릭합니다.

6.	[확인]을 클릭합니다.

[열기] 대화 상자가 나옵니다.

7.	가져올 파일을 선택하고 [열기]를 클릭합니다.

참조: Trimble Geomatics Office는 M5 파일의 모든 좌표를 그리드 점으로서만 도입합니다. Trimble Geomatics Office의 좌표가 Trimble Elta GPS controller의 좌표와 매치되도록 하기 위해서는 측량 시작시 현장에서 반드시 캘리브레이션(변환)을 수행하여야 합니다.

현재 작업 중인 Trimble Geomatics Office 프로젝트를 Elta GPS Controller M5 파일에 내보내려면:

1.	[파일 / 내보내기]를 실행합니다.

[내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	'Trimble Elta GPS Controller M5 파일 (*.dat)' 옵션을 하이라이트합니다.

4.	[옵션]을 클릭하여 [M5 파일 옵션] 대화 상자를 불러와 파일을 설정합니다.

5.	설정 내용을 수용하고 [내보내기] 대화 상자로 돌아가려면 [확인]을 클릭합니다.

6.	[확인]을 클릭합니다.

[다른 이름으로 저장] 대화 상자가 나옵니다.

7.	파일을 저장해 둘 폴더를 선택합니다.

8.	[파일 이름] 필드에 이름을 입력하고 [저장]을 클릭합니다.


[M5 파일 옵션] 대화 상자

[M5 파일 옵션] 대화 상자는 도입 및 송출할 다음 파일들의 설정에 씁니다.

  Trimble 3300/3600/5600 Elta M5 파일

  Trimble Elta GPS Controller M5 파일

측량기 종류, 파일 마킹, 좌표 설정, 중복 포인트 설정(가져오기시의) 등을 명시합니다.

이 대화 상자를 불러오려면:

1.	[파일 / 내보내기(또는 가져오기)]를 실행합니다.

2.	[측량] 탭을 선택합니다.

3.	다음 중 하나의 옵션을 선택합니다.

  Trimble 3300/3600/5600 Elta M5 파일 (*.dat)

  Trimble Elta GPS Controller M5 파일 (*.dat)

4.	[옵션]을 클릭합니다.

파일 마킹

다음 중 하나를 선택합니다.

  기본값 (Trimble의 권장 옵션)

기본값 옵션의 선 포맷 설정과 포맷 미리 보기를 보려면 [고급] 버튼을 클릭합니다.

참조: 기본값은 선택한 측량기의 종류 여하에 따라 달라집니다.

  사용자 정의

사용자 정의 옵션을 쓰면 선 포맷 설정을 변경하고 포맷 미리 보기 섹션의 변경 내용을 볼 수 있습니다. '사용자 정의'를 선택하고 [고급]을 클릭합니다. [고급 마킹 옵션 ] 대화 상자에서:

a.	포인트 이름, 코드, 설명의 시작 문자의 위치를 지정합니다.

b.	포인트 이름, 코드, 설명의 필드 폭을 지정합니다.

c.	마킹 번호를 입력합니다.

참조: 사용자 정의의 선 포맷 설정이 올바르지 않으면 Trimble Geomatics Office는 올바른 설정을 요청합니다.

좌표 설정

'좌표 순서'와 '표고' 드롭다운 목록으로부터 도입 또는 송출할 파일의 좌표 순서와 좌표 라벨을 선택합니다.

참조:

나오는 필드는 선택하는 측량기 종류에 따라 달라집니다.

가용 공간보다 긴 포인트 이름, 코드, 설명은 내보내기시 잘립니다.

이름이 문자+숫자로 되어 있는 포인트는 Trimble 3300 측량기에로 송출되지 않습니다.


포인트 - 개요
포인트 − 개요

Trimble Geomatics Office 프로젝트에서 가장 핵심적인 요소는 포인트입니다. 데이터를 가져오거나 [포인트 삽입] 대화 상자나 [방위각 및 거리로 포인트 삽입] 대화 상자를 이용하여 포인트를 추가할 때는 언제나 포인트가 프로젝트에 추가됩니다.

포인트는 '측량 보기'와 '평면도 보기' 모드 모두에서 볼 수 있습니다. 어떤 포인트의 내역을 보려면 그 포인트를 선택한 후 등록정보 창을 엽니다.

포인트는 계산된 위치를 가지고 있으며, 이는 재계산에 의해 결정됩니다. 이 위치는 키입력 좌표 및 관측치를 이용한 해당 포인트의 최적 위치입니다.

'측량 보기'에서는 포인트가 점으로 나타나는데, 그 점들 간의 관측치도 모두 표시됩니다. '평면도 보기'에서 포인트는 해당 포인트 스타일에 따라 표시됩니다. 데이터베이스는 중복 포인트를 허용합니다.


[포인트 삽입] 대화 상자

이 대화 상자는 데이터베이스에 포인트를 삽입할 경우에 사용합니다. 나타나는 필드는 [좌표형] 필드에서 사용자가 선택한 옵션에 따라 달라집니다.

이 대화 상자를 불러오려면

  '측량 보기'에서 [삽입 / 포인트] 명령을 실행하거나

  '평면도 보기'에서 다음 중 하나의 방법을 사용합니다:

  [삽입 / 포인트] 명령을 실행합니다.

  [포인트 삽입] 도구 [image] 를 클릭합니다.

삽입

데이터베이스에 포인트를 삽입하고자 할 경우에는 [삽입]을 클릭합니다. 대화 상자는 다른 (새로운) 포인트를 삽입할 수 있도록 남아 있습니다.

참조: 정의되지 않은 기본 투영법(Transverse Mercator)으로 프로젝트에 첫째 그리드 위치나 GPS 위치를 추가할 경우에는, 그 투영법을 정확히 초기화할 수 있도록 Trimble Geomatics Office가 알맞은 대화 상자를 제시합니다.

닫기

포인트를 삽입한 후  대화 상자를 종료하고자 할 경우에는 [닫기]를 클릭합니다.

이름

키보드를 사용하여 이름을 입력합니다. 이름은 최고 16 개까지의 문자를 넣을 수 있습니다.

다음과 같은 기호는 이름에 사용할 수 없습니다:

  중괄호 {}

  꺽쇠 괄호 []

  둥근 괄호 ()

  퍼센트 기호 %

  등호 =

  큰 따옴표 � " 또는 작은 따옴표' '

참조: 포인트를 연속하여 삽입할 시, 직전에 입력된 포인트 이름의 끝부분이 숫자일 경우  숫자가 자동으로 하나씩 늘어납니다.

참조: [프로젝트 등록정보] 대화 상자 에서 기본 포인트 이름을 설정하고자 할 경우에는 [단위와 포맷] 탭 을 선택한 후 [자동 포인트 시작 이름] 필드를 이용합니다.

 [좌표내역] 상자

각각의 좌표 구성요소 (수평, 표고, 타원체고)에 대하여 알맞은 질을 선택하십시오. 이 질들은 재계산이 포인트에 대한 최적의 위치를 결정하는 데 사용됩니다.

[좌표내역] 상자는 사용자가 이 대화 상자에서 [WGS-84], [그리드], [로컬] 중 어느 옵션을 선택하느냐에 따라 변합니다. 각각의 [좌표내역] 상자는 서로 다른 좌표 보기 를 나타냅니다.

만약 그리드 옵션을 선택하면 다음과 같은 필드가 나옵니다:

X 좌표	필드 필인(Fill-in)을 이용하거나 키보드를 사용하여 값을 입력합니다. 필드 필인을 이용할 경우에, [X 좌표] 및 [Y 좌표] 필드에는 사용자가 클릭한 곳의 위치가 입력됩니다.
Y 좌표	필드 필인(Fill-in)을 이용하거나 키보드를 사용하여 값을 입력합니다. 필드 필인을 이용할 경우에, [X 좌표] 및 [Y 좌표] 필드에는 사용자가 클릭한 곳의 위치가 입력됩니다.

[WGS-84] 또는 [로컬] 옵션을 선택하고, [프로젝트 등록정보] 대화 상자 / [단위와 포맷] 탭에서 [WGS-84표시 형식]을 L,L,H로 설정하면 다음과 같은 필드가 나타납니다:

위도	필드 필인(Fill-in)을 이용하거나 키보드를 사용하여 값을 입력합니다. 필드 필인을 이용할 경우에, [위도] 및 [경도] 필드에는 사용자가 클릭한 곳의 위치가 입력됩니다.
경도	필드 필인(Fill-in)을 이용하거나 키보드를 사용하여 값을 입력합니다. 필드 필인을 이용할 경우에, [위도] 및 [경도] 필드에는 사용자가 클릭한 곳의 위치가 입력됩니다.
어떤 옵션을 선택하든 다음과 같은 필드가 나타납니다.

표고	키보드를 사용하여 값을 입력하거나 기존의 포인트를 클릭합니다. 기존의 포인트를 클릭했을 경우에는 그 포인트의 표고 값이 [표고] 필드에 입력됩니다.
타원체고	필드 필인(Fill-in)을 이용하거나 키보드를 사용하여 값을 입력합니다. 기존의 포인트를 클릭했을 경우에는 그 포인트의 타원체고 값이 [타원체고] 필드에 입력 됩니다.
팁: '측량 보기'에서 관측선을 따라, 또는 '평면도 보기'에서 선 작업을 따라 포인트를 위치시키기 위해서는 필드 필인(Fill-in)을 실행하는 동안 Ctrl키를 누릅니다. 필드 필인을 사용하여 대략의 좌표를 구한 후, 이 값을 편집 할 수 있습니다.

참조: [프로젝트 등록정보] 대화 상자 / [단위와 포맷] 탭에서 [WGS-84표시형식]을 X, Y, Z으로 설정하면, [X], [Y], [Z] 필드가 나타납니다. 필드 필인(Fill-in)을을 이용하거나 키보드를 사용하여 값을 입력합니다. 필드 필인을 이용할 경우, 이 필드에는 사용자가 클릭한 곳의 위치가 입력됩니다.

좌표형

데이터베이스에 좌표를 저장하기 위해 사용하고자 하는 옵션(WGS-84, 로컬, 그리드)을 선택합니다. 좌표형을 선택하면 좌표 보기는 그 좌표형과 동일한 설정으로 바뀝니다.

참조: [좌표내역] 상자 내의 필드를 편집하고자 할 경우에는, 좌표형과 좌표 보기의 설정이 반드시 동일해야 합니다.

[CAD 내역] 상자

이 상자는 포인트의 필드 중 '평면도 보기'에서 보여지는 모든 필드를 포함하고 있습니다.

피쳐 코드

키보드로 값을 입력하거나 기존의 포인트를 클릭합니다. 기존의 포인트를 클릭하면 그 포인트의 피쳐 코드 값이 [피쳐 코드] 필드에 입력됩니다.

설명

키보드로 값을 입력하거나 기존의 포인트를 클릭 합니다. 기존의 포인트를 클릭하면 그 포인트의 설명 값이 [설명] 필드에 입력됩니다.

레이어

다음 중 하나의 방법을 이용합니다:

  목록에서 기존의 레이어를 선택합니다.

  키보드를 이용하여 새로운 레이어를 입력합니다.  [새 레이어] 대화 상자가 나타납니다.

  기존의 포인트를 클릭합니다. 기존의 포인트를 클릭하면 그 포인트의 레이어 값이 [레이어] 필드에 입력됩니다.

포인트 스타일

다음 중 하나의 방법을 이용합니다:

  목록에서 기존의 포인트 스타일을 선택합니다.

  키보드를 사용하여 새로운 포인트 스타일을 입력합니다.  [포인트 스타일 만들기] 대화 상자가 나타납니다.

  기존의 포인트를 클릭합니다. 기존의 포인트를 클릭하면 그 포인트의 포인트 스타일 값이 [포인트 스타일] 필드에 입력됩니다.


[방위각 및 거리로 포인트] 명령

이 명령은 알려진 포인트로부터 방위각 및 거리를 이용하여 포인트를 삽입할 경우에 사용합니다.

이 명령은 [삽입 / 방위각 및 거리로 포인트]를 선택함으로써 실행합니다.

[방위각 및 거리로 포인트 삽입] 대화 상자가 나옵니다.


[방위각 및 거리로 포인트 삽입] 대화 상자

이 대화 상자는 알려진 포인트로부터 방위각 및 거리를 이용하여 포인트를 삽입할 경우에 사용합니다.

이 대화 상자를 불러오려면

  [삽입 / 방위각 및 거리로 포인트] 명령을 실행하거나

  '평면도 보기'에서 [방위각 및 거리로 포인트 추가] 도구 [image] 를 클릭합니다.

참조: 새로운 포인트의 질은 시점과 같습니다. 델타 표고가 미지정일 경우 새로운 포인트의 [표고] 및 [타원체고] 필드는 알 수가 없습니다.

포인트 이름

키보드를 사용하여 이름을 입력합니다. 이름은 최고 16 개까지의 문자를 넣을 수 있습니다.

다음과 같은 기호는 이름에 사용할 수 없습니다:

  중괄호 {}

  꺽쇠 괄호 []

  둥근 괄호 ()

  퍼센트 기호 %

  등호 =

  큰 따옴표 � " 또는 작은 따옴표' '

시점

키보드를 사용하여 기존의 포인트 이름을 입력하거나 기존의 포인트를 클릭합니다.

방위각

이 필드는 방위각 종류의 설정에 따라 다릅니다. [단위와 포맷] 탭에서 [각도 포맷 (도)]에 설정된 포맷으로 방위각 값을 입력합니다.

거리

이 필드는 [단위와 포맷] 탭의 [표시 거리] 필드의 설정 여하에 따라 달라집니다. 단위를 지정하지 않으면 프로젝트의 현재 단위가 사용되지만 사용자가 m, ift (international feet), 또는 sft (US Survey feet) 등으로 지정할 수 있습니다.

델타 표고

이 값이 시점의 표고에 더해짐으로써 새로운 포인트의 표고가 도출됩니다.정 방향 변화란 새 포인트가 시점보다 더 큰 표고 값을 가지는 것입니다. 새로운 포인트가 시점보다 더 작은 표고 값을 가질 경우에는 음수를 입력합니다. 단위를 지정하지 않으면 프로젝트의 현재 단위가 사용되지만 사용자가 m, ift (international feet), 또는 sft (US Survey feet) 등을 지정할 수 있습니다.델타 표고를 정하지 않으면 새로운 포인트의 표고는 공백 값이 됩니다.

방위각 종류

이 상자는 그리드 방위각 또는 법선면 전방 방위각을 선택하고자 할 경우 사용합니다.

  그리드 - 그리드 방위각을 표시할 때 선택합니다.

  법선면 전방 - 법선면 전방 방위각을 표시할 때 선택합니다.

방식

이 상자는 포인트가 삽입된 후 소프트웨어가 대화 상자를 준비하는 방법을 선택하고자 할 경우에 사용합니다.

  순차형 - 새로운 포인트가 추가될 때 그 새 포인트의 이름을 [시점] 필드에 삽입합니다. 이 옵션은 트래버스를 입력할 때 사용합니다.

  방사형 - 시점의 이름을 동일하게 유지합니다. 이 옵션은 동일 포인트로부터 방사형으로 포인트에 입력시킬 때 사용합니다.

연결

이 확인란은 시점과 새 포인트 사이에 선을 그을 때 사용합니다. 선은 현재 레이어에 추가되는데, 현재 레이어의 기본 선 스타일로 그려집니다. 이 선은 '평면도 보기'에서만 볼 수 있습니다.


[방위각 삽입] 대화 상자

방위각은 비GPS 관측치의 배향에 사용됩니다. 이 대화 상자는 두 포인트 사이에 방위각을 삽입시킬 때 사용합니다.

이 대화 상자를 불러오려면

  '측량 보기'에서 [삽입 / 방위각] 명령을 실행합니다.

시점과 종점

이들 필드에서는 키보드나 필드 필인(Fill-in)을 이용하여 기존 포인트의 이름을 입력합니다.

방위각

기존의 �시점�과 �종점� 을  입력하면 계산 방위각 값이 나타납니다. 필요한 경우에는 사용자가 이 값과 해당 방위각의 등급을 수정할 수 있습니다. 이 필드에 표시되는 방위각은 사용자가  아래에 지정하는 방위각 보기 의 설정에 따라 달라집니다.

해당 포인트 쌍에 이미 방위각이 있을 경우에는 그 방위각을 덮어쓸 것인지 확인하는 메시지가 나옵니다. 물어봅니다.

방위각 종류

이 필드는 방위각을 데이터베이스에 어떻게 저장할 것인지, 즉 그리드 또는 법선면 전방 방위각 중 어느 것으로 저장할 것인지를 결정하는 데 사용합니다.

그리드/ 법선면 전방 방위각

좌표를 [방위각 삽입] 대화 상자에서(즉, 방위각 보기)  어떻게 표시할 것인지 결정하기 위하여 둘 중 하나의 옵션을 선택합니다.

참조: 이 대화 상자에서 필드를 편집하려면, 방위각 종류와 방위각보기가 반드시 동일해야 합니다 .

참조: �종점�이 좌표 값을 가지고 있지 않을 경우에는 그리드 방위각과 법선면 전방 방위각 사이의 변환을 계산할 수 없습니다.이 때 방위각은 공백 값으로 표시됩니다.

삽입

이 단추는 프로젝트에 방위각을 삽입할 경우에 사용합니다. 방위각은 두 포인트 사이에 방향을 나타내는 화살표와 함께 표시됩니다.

닫기

이 단추는 대화 상자를 닫을 때 사용합니다.


    [선] 명령

이 명령은 선을 데이터베이스에 삽입시킬 때 사용합니다.

이 명령은 다음 방법으로 실행합니다.

  [삽입 / 선]을 선택합니다.

[선 작업 삽입] 대화 상자가 나타나며 [선] 탭이 선택된 상태입니다.


    [선 작업 삽입] 대화 상자

이 대화 상자는 새로운 선 작업 (선, 곡선 또는 호)을 데이터베이스에 삽입할 경우에 사용합니다.

이 대화 상자는 다음 중 한가지 방법으로 불러옵니다.

선	[선 삽입] 도구 [image] 를 선택   [삽입 / 선] 명령 선택
곡선	[곡선 삽입] 도구 [image] 를 선택    [삽입 / 곡선] 명령 선택
호	[호 삽입] 도구 [image] 를 선택    [삽입 / 호] 명령 선택

적절한 탭이 선택되어진 상태로 [선 작업 삽입] 대화 상자가 나타납니다.

대화 상자의 내역은 필드 필인(Fill-in)을 이용하거나 키보드로써 입력합니다. 선 작업을 신속히 추가하고자 할 경우에는 [종점] 필드에서 필드 필인을 더블 클릭합니다.

선 작업 형태는 언제나 변경이 가능합니다. 이 경우 선, 곡선, 호 또는 어떤 조합의 배열이라도 연결할 수 있습니다.

데이터베이스에는 3 가지 형태의 선 작업을 추가할 수 있습니다:

  선

  호

  곡선

삽입

[삽입]을 누르면 선 작업이 프로젝트에 추가되고 대화 상자가 계속 열려 있어 새 선 작업을 추가할 수 있습니다.

이제 시점 값이 종점 값으로 됨으로써 다음 선 작업의 준비가 이루어집니다.


선  - 개요
    선 − 개요

추가 정보

방법...	대화 상자	기타
개요

Trimble Geomatics Office에서는 포인트들 사이에 선을 삽입할 수 있습니다. 선의 경계(울타리 선, 건물, 파이프라인 등)를 정의하기 위해 프로젝트에 선을 삽입합니다.

'평면도 보기'에서 프로젝트를 보면 그래픽 창에 선이 나타납니다. 어떤 선의 등록정보를 보기 위해서는 그 선을 선택한 후 등록정보 창 을 엽니다.

선은 해당 선 스타일에 따라 표시됩니다. 사용자는 Trimble의 선 스타일을 사용하거나 사용자 스타일을 만들 수 있습니다.

선은 특정 포맷(예:AutoCAD 및 TRIMMAP 포맷)으로 내보낼 수 있습니다.


호 - 개요
    호 − 개요

추가 정보

방법...	대화 상자	기타
개요

포인트들 사이에 부드러운 원형의 호를 나타내고자 할 때 호를 만듭니다.

'평면도 보기'에서 프로젝트를 보면 그래픽 창에 호가 나타납니다. 호의 등록정보를 보기 위해서는 그 호를 선택한 후 등록정보 창을 엽니다.

호는 해당 선 스타일에 따라 표시됩니다. Trimble의 선 스타일을 사용하거나 사용자 스타일을 만들 수 있습니다.

호는 특정 포맷(예:AutoCAD 및 TRIMMAP 포맷)으로 내보낼 수 있습니다.


곡선 - 개요
    곡선 − 개요

추가 정보

방법...	대화 상자	기타
개요

포인트들 사이에 최적의 곡선을 만들고자 할 경우에 곡선 삽입 기능을 사용합니다. 직선이 아닌 경계선(수로나 트랙 등)을 정의하는데 곡선을 사용합니다.

'평면도 보기' 에서 프로젝트를 보면 그래픽 창에 곡선이 나타납니다.

곡선은 해당 선 스타일에 따라 표시됩니다. Trimble의 선 스타일을 사용하거나 사용자 스타일을 만들 수 있습니다.

다른 곡선에서 이미 사용된 포인트로부터 곡선을 삽입할 경우에는 Trimble Geomatics Office가 기존의 곡선을 다시 계산하여 부드러운 곡선이 표시되도록 합니다.

곡선은 특정 포맷(예:AutoCAD 및 TRIMMAP 포맷)으로 내보낼 수 있습니다.


[선 작업 삽입] 대화 상자 - [선] 탭
    [선 작업 삽입] 대화 상자 − [선] 탭

이 대화 상자는 데이터베이스에 선을 삽입할 때 이용합니다.

이 기능을 이용하려면 '평면도 보기'에서 다음 중 하나의 방법을 선택합니다.

  [삽입 / 선]을 선택합니다.

  [선 삽입] 도구 [image] 를 선택합니다.

[선 작업 삽입] 대화 상자가 나타나며 [선] 탭이 선택된 상태입니다.

시점

다음 중 하나의 방법을 이용합니다.

  필드 필인(Fill-in)을 이용하여 정의할 선의 첫번째 포인트를 선택합니다.

  정의할 선의 첫 번 째 포인트의 이름을 입력합니다.

종점

다음 중 하나의 방법을 이용합니다.

  필드 필인(Fill-in)을 이용하여 정의할 선의 두번째 포인트를 선택합니다.

  정의할 선의 두 번 째 포인트의 이름을 입력합니다.

레이어

다음 중 하나의 방법을 이용합니다.

  선을 추가해 넣고자 하는 레이어를 선택합니다.

  새 레이어를 만들기 위해 새 레이어 이름을 입력합니다. [새 레이어] 대화 상자가 나타납니다.

선 스타일

선의 표시에 이용하고자 하는 선 스타일을 선택합니다. [CAD 스타일] 대화 상자. 안에 있는 선 스타일을 모두 이용할 수 있습니다.

삽입

선을 삽입할 때는 [삽입]을 클릭합니다. [종점] 필드에서 선택된 포인트는 [시점] 필드에서 기본값으로 선택됩니다. 이는 필요 시 사용자가 바꿀 수 있습니다.

닫기

선 삽입을 중지하고자 할 경우에는 [닫기]를 클릭합니다.


    [호] 명령

이 명령은 호를 데이터베이스에 삽입할 때 사용합니다.

'평면도 보기'에서 다음 중 하나의 방법으로 실행합니다:

  [삽입 / 호]를 선택합니다.

  [호 삽입] 도구 [image] 를 선택합니다.

[선 작업 삽입] 대화 상자가 [호] 탭이 선택되어진 상태로 나타납니다.


[선 작업 삽입] 대화 상자- [호] 탭
    [선 작업 삽입] 대화 상자 − [호] 탭

이 대화 상자는 호를 데이터베이스에 삽입할 때 사용합니다.

'평면도 보기'에서 다음 중 하나의 방법으로 실행합니다:

  [삽입 / 호]를 선택합니다.

  [호 삽입] 도구 [image] 를 선택합니다.

 [선 작업 삽입] 대화 상자가 [호] 탭이 선택되어진 상태로 나타납니다.

시점

다음 중 하나의 방법으로 실행합니다:

  필드 필인(Fill-in)을 이용, 해당 포인트를 클릭합니다.

  키보드를 이용하여 포인트 이름을 입력합니다.

종점

다음 중 하나의 방법으로 실행합니다:

  필드 필인(Fill-in)을 이용, 해당 포인트를 클릭합니다.

  키보드를 이용하여 포인트 이름을 입력합니다.

중심점

기존의 포인트를 호의 중심으로 사용하고자 할 경우에는 다음 중 하나의 방법으로 실행합니다.

  기존의 포인트 이름을 입력합니다.

  필드 필인(Fill-in)을 이용, 기존의 포인트를 선택합니다.

기존 포인트의 좌표가 [중심 X 좌표] 및 [중심 Y 좌표] 필드로 복사됩니다.

중심 X 좌표, 중심 Y 좌표

좌표를 호의 중심으로 사용하고자 할 경우에는 필드 필인(Fill-in)을 이용하여 그래픽 창의 한 위치를 클릭합니다. 그 곳의 좌표가 이들 필드로 복사됩니다.

참조: 중심점과 중심 좌표를 같이 입력하면 중심점이 사용됩니다.

열호

열호를 만들고자 할 경우에는 '참' 옵션을 선택합니다. 그 외의 경우에는 '거짓' 옵션을 선택합니다. 두 포인트 사이에 항상 2 개의 호를 그릴 수 있으며 이 호들은 하나의 원을 형성합니다. 이 설정은 사용자가 어떤 호를 그리고자 하는지를 정합니다. 이에 관하여는 다음에서 설명되어 있습니다:

참조: 호의 중심점은 두 포인트를 잇는 직선의 중심점이거나, 또는 [중심 X 좌표] 및 [중심 Y 좌표] 필드의 좌표입니다.

레이어

다음 중 하나의 방법으로 실행합니다.

  호를 추가해 넣고자 하는 레이어를 선택합니다.

  새 레이어를 만들기 위해 새 레이어 이름을 입력합니다. [새 레이어] 대화 상자가 나타납니다.

선 스타일

호의 표시에 이용하고자 하는 [선 스타일]을 선택합니다. [CAD 스타일] 대화 상자에 있는 호 스타일은 모두 이용할 수 있습니다.

삽입

호를 삽입할 때는 [삽입]을 클릭합니다. [종점] 필드에서 선택된 포인트는 [시점] 필드에서 기본값으로 선택됩니다. 이는 필요 시 사용자가 바꿀 수 있습니다.

닫기

호 삽입을 중지하고자 할 경우에는 [닫기]를 클릭합니다.


    [곡선] 명령

이 명령은 곡선을 데이터베이스에 삽입할 때 사용합니다.

이 기능을 이용하려면 '평면도 보기'에서 다음 중 하나의 방법을 사용합니다 :

  [삽입 / 곡선]을 선택합니다.

  [곡선 삽입] 도구 [image] 를 선택합니다.

[선 작업 삽입] 대화 상자가 [곡선] 탭이 선택된 상태로 나타납니다.


[선 작업 삽입] 대화 상자 - [곡선] 탭
    [선 작업 삽입] 대화 상자 − [곡선] 탭

이 대화 상자는 곡선을 데이터베이스에 삽입할 때 사용합니다.

이 기능을 이용하려면 '평면도 보기'에서 다음 중 하나의 방법을 사용합니다:

  [삽입 / 곡선]을 선택합니다.

  [곡선 삽입] 도구 [image] 를 선택합니다.

 [선 작업 삽입] 대화 상자가 [곡선] 탭이 선택된 상태로 나타납니다.

시점

다음 중 하나의 방법을 택합니다:

  필드 필인(Fill-in)을 이용, 해당 포인트를 클릭합니다.

  키보드를 이용하여 포인트 이름을 입력합니다.

종점

다음 중 하나의 방법을 택합니다:

  필드 필인(Fill-in)을 이용, 해당 포인트들을 클릭합니다.

  키보드를 이용하여 포인트 이름을 입력합니다.

진입 접선, 퇴출 접선

곡선을 정의하기 위해 사용된 포인트에 근거한 접선 값을 자동으로 입력하기위해서는 그 값을 <자동>으로 놓아둡니다. 필요하다면 사용자가 다른 접선 값을 입력할 수도 있습니다.

곡선 너비

0과 1 사이의 값을 입력합니다. 이는 그 곡선의 폭이 얼마인지 보여줍니다. 이 값이 클수록 곡선의 폭이 큽니다.

레이어

다음 중 하나의 방법으로 실행합니다:

  곡선을 삽입해 넣고자 하는 레이어를 선택합니다.

  새 레이어를 만들기 위해 새 레이어 이름을 입력합니다. [새 레이어] 대화 상자가 나타납니다.

선 스타일

곡선의 표시에 이용하고자 하는 [선 스타일]을 선택합니다. [CAD 스타일] 대화 상자 안에 있는 선 스타일은 모두 이용할 수 있습니다.

삽입

곡선을 삽입할 때는 [삽입]을 클릭합니다. [종점] 필드에서 선택된 포인트는 [시점] 필드에서 기본값으로 선택됩니다. 이는 필요 시 사용자가 바꿀 수 있습니다.

닫기

곡선 삽입을 중지하고자 할 경우에는 [닫기]를 클릭합니다.


    [텍스트] 명령

이 명령은 [삽입 텍스트] 대화 상자를 열 때 사용합니다.

'평면도 보기'에서 다음 중 하나의 방법으로 실행합니다:

  [삽입 / 텍스트]를 선택합니다.

  [삽입 텍스트] 도구 [image] 를 클릭합니다.


    [삽입 텍스트] 대화 상자

이 대화 상자는 새로운 텍스트를 데이터베이스에 삽입할 때 사용합니다.

이 기능을 이용하려면 '평면도 보기'에서 다음 중 하나의 방법을 사용합니다:

  [삽입 / 텍스트]를 선택합니다.

  [삽입 텍스트] 도구 [image] 를 클릭합니다.

텍스트 표현문

사용자가 나타내고자 하는 텍스트를 입력합니다. 필드 코드(예를 들면, 프로젝트 이름)를 이용하고자 할 경우에는 마우스 오른 쪽을 클릭하여 바로 가기 메뉴에서 [필드]를 선택합니다.

X 좌표

텍스트의 위치에 대한 X 좌표 값을 입력하고자 할 경우에는 다음 중 하나의 방법으로 실행합니다:

  그래픽 창의 한 위치를 클릭하여 필드 필인(Fill-in)을 이용합니다.

  키보드를 사용하여 X 좌표 값을 입력합니다.

Y 좌표

텍스트의 위치에 대한 Y 좌표 값을 입력하고자 할 경우에는 다음 중 하나의 방법으로 실행합니다:

  그래픽 창의 한 위치를 클릭하여 필드 필인(Fill-in)을 이용합니다.

  키보드를 사용하여 Y 좌표 값을 입력합니다.

배향

텍스트 개체의 배향을 입력합니다. 배향을 지정하지 않으면 텍스트는 창에 수평으로 가로질러 표시됩니다.

앵커 형

X 좌표 값 및 Y 좌표 값과 관련하여 텍스트를 어디에 위치시킬 것인가를 정합니다. 목록으로부터 값을 선택합니다.

레이어

텍스트를 추가하고자 하는 레이어를 목록으로부터 선택합니다. 새 레이어에 텍스트를 입력하고자 할 때는 새 이름을 타자하면 [새 레이어] 대화 상자가 나타납니다.

텍스트 스타일

목록에서 텍스트 개체에 대한 텍스트 스타일을 선택합니다. 텍스트를 추가할 레이어에 이미 설정되어 있는 기본 텍스트 스타일을 이용하고자 하면 [레이어 기준] 옵션을 선택합니다.

텍스트 스타일을 만들거나 편집할 경우에는 [편집 / 스타일] 명령을 실행합니다.

삽입

[삽입]을 누르면 텍스트가 프로젝트에 추가되고 대화 상자가 계속 열려 있어 텍스트를 추가 입력할 수 있습니다.


텍스트 - 개요
텍스트 − 개요

추가 정보

방법...	대화 상자	기타
개요

프로젝트에 텍스트를 추가할 수 있습니다. 예를 들어 어떤 그림을 설명하거나 프로젝트의 표제를 표시하고자 할 때 텍스트를 추가합니다.

텍스트는 그래픽 창에 나타납니다. 텍스트의 등록 정보를 보기 위해서는 텍스트를 선택한 후 등록정보 창을 엽니다. 또는 그래픽 창의 새로운 위치로 텍스트를 드래그할 수도 있고 텍스트 회전.도 가능합니다.

텍스트는 특정 포맷(예:AutoCAD 및 TRIMMAP 포맷)으로 내보낼 수 있습니다.


주석 - 개요
    주석 − 개요

추가 정보

방법...	대화 상자	기타
개요

주석은 개체(포인트, 선 및 호)와 연관된 텍스트이며 주석 템플리트에서 정의하는 대로 나타납니다.

주석 템플리트는 다음의 것들을 정의합니다.

  주석의 대상

  개체를 기준으로 한 주석의 위치

주석 템플리트는 사용자 정의 텍스트와 필드 코드의 조합을 가지고 있을 수 있습니다. 주석을 다는 필드가 변할 때마다 필드 코드는 확장됩니다. 예를 들어 어느 포인트가 표고 주석을 가지고 있을 때 그 포인트의 표고가 변하면 그 주석도 업데이트됩니다.

주석은 프로젝트에 저장됩니다.

주석 템플리트

Trimble은 미리 만들어진 주석 템플리트를 제공합니다. 피쳐 코드를 처리할 때 피쳐 및 속성 라이브러리가 주석 템플리트를 포함하고 있으면 이 템플리트가 주석 템플리트 목록에 추가됩니다. 피쳐 및 속성 라이브러리의 주석 템플리트에 텍스트 스타일이 설정되어 있지 않기 때문에 그 주석 템플리트가Trimble Geomatics Office 프로젝트에 추가될 때 표준 텍스트 스타일이 기본값으로 사용됩니다.

주석 추가

주석을 추가하고자 할 경우에는 '평면도 보기'에서 다음 중 하나의 방법을 사용합니다:

  [삽입 / 주석]을 선택합니다.

  [편집 / 주석 템플리트]를 선택하고 [새로 만들기]를 클릭합니다.

  개체에 주석을 달 때는 피쳐 코드 처리를 이용합니다. 자세한 정보는 Trimble Feature and Attribute Editor유틸리티의 도움말을 참조합니다.

참조: 기존의 주석을 편집하고자 할 경우에는 등록정보 창을 이용합니다.


    [주석] 명령

이 명령은 선택한 포인트, 선 또는 호에 주석을 달 때 사용합니다.

이 명령은 [삽입 / 주석]을 선택하여 실행합니다.

[주석 달기] 대화 상자가 나타납니다.


    [주석 달기] 대화 상자

 개요 및 추가 정보

이 대화 상자는 선택한 포인트, 선 또는 호에 주석을 달 때 사용합니다.

이것은 [삽입 / 주석] 명령을 실행하여 불러옵니다.

도면 크기만한 개체의 주석 삽입 위치는 파일 / [시트 설정] 대화 상자에 설정된 그 개체의 치수와 플롯 축척을 참조하여 결정됩니다. 문자 높이의 1/3 정도의 여백이 주석과 그 개체 사이에 추가됩니다.

주석 템플리트

목록에서 원하는 템플리트를 선택합니다.

기존의 주석 유지

이 확인란은 주석을 달 개체에 할당된 기존의 주석을 유지하고자 할 경우에 선택합니다. 새 주석은 기존의 주석에 더하여 따로 추가되며 그 위치가 서로 동일하더라도 무방합니다.

팁: 이 기능은 [주석 템플리트] 대화 상자에서 서로 다른 레이어로 분리된 개체들에 여러 개의 주석을 달고자 할 경우에 사용할 수 있습니다.

이 확인란을 선택 해제하면 주석을 달 개체에 할당된 주석은 주석이 추가되기 전에 데이터베이스에서 제거됩니다.

주석 달기

개체에 주석을 다는 방법에는 2 가지가 있습니다:

선택 부분	선택한 개체에 주석을 달 때 선택합니다.
전체 데이터베이스	모든 개체에 주석을 달 때 선택합니다.
이 단추는 X 좌표가 선택되었을 때는 사용할 수 없습니다. 이 때는 모든 개체에 주석이 달리게 됩니다.

제거

선택한 개체에서 모든 주석을 제거하고자 할 경우에는 다음 중 하나의 방법을 사용합니다:

  [제거]를 클릭합니다.

  주석을 선택한 후[편집 / 삭제]를 실행합니다.

템플리트

[주석 템플리트] 대화 상자를 이용하고자 할 때 [템플리트]를 클릭합니다. 이 대화 상자를 이용하여 만들거나 수정, 삭제하고자 하는 주석 템플리트를 선택합니다. 자세한 사항은 [주석 템플리트] 대화 상자를 참조합니다.


    [주석 템플리트] 대화 상자

 개요 및 추가 정보

이 대화 상자는 주석 템플리트의 관리에 이용합니다.

이 대화 상자를 불러오려면

1.	[삽입 / 주석] 명령을 실행합니다.

2.	[템플리트]를 클릭합니다.

주석 템플리트는 하나 또는 여러 주석의 스타일, 위치 및 내용을 정의합니다. 일단 정의되면 해당 주석 템플리트와는 독립적인 별개의 텍스트 정보가 됩니다. 주석은 프로젝트에 저장됩니다.

Trimble Geomatics Office는 필드 코드를 사용하여 주석이 나타내는 값을 명시합니다. 주석은 고정 불변의 것이 아닙니다 - 상위 개체가 변할 때마다 필드 코드는 재확장 됩니다.

주석 템플리트

이 목록은 프로젝트에서 현재 사용되는 모든 주석 템플리트를 포함합니다.

기존의 주석 템플리트를 수정하거나 삭제하고자 할 경우에는 해당 템플리트 이름을 하이라이트합니다.

새로 만들기

새로운 주석 템플리트를 만들고자 할 경우에는 [새로 만들기]를 클릭하면 [주석 템플리트] 대화 상자가 나타납니다.

편집

기존의 주석 템플리트를 수정하고자 할 경우에는 [편집]을 클릭하면 [주석 템플리트] 대화 상자가 나타납니다.

삭제

선택된 주석 템플리트를 삭제하고자 할 경우에는 [삭제]를 클릭하면 프로젝트에서 삭제됩니다.


    [주석 템플리트] 대화 상자

 개요 및 추가 정보

만들거나 수정 중인 주석 템플리트의 내용을 구성할 때는 이 대화 상자의 탭을 사용합니다.

이 기능을 이용하려면,

1.	다음 중 하나의 방법을 실행합니다:

  [삽입 / 주석]을 선택한 후 [템플리트]를 클릭합니다.

  [편집 / 주석 템플리트]를 선택합니다.

[주석 템플리트] 대화 상자가 나타납니다.

2.	[새로 만들기] 또는 [편집]을 클릭합니다.

주석 템플리트를 정의하고자 할 경우에는 4 가지의 탭을 사용합니다:

  설정

  포인트

  선

  호


[주석 템플리트] 대화 상자 - [설정] 탭
     [주석 템플리트] 대화 상자 − [설정] 탭

 개요 및 추가 정보

주석 템플리트의 일반 설정을 편집하고자 할 경우에는 [설정] 탭을 사용합니다.

이 기능을 이용하려면,

1.	[삽입 / 주석]을 선택합니다.

2.	[템플리트]를 클릭합니다.

3.	[새로 만들기] 또는 [편집]을 클릭합니다.

4.	[설정] 탭을 선택합니다.

이름

템플리트의 현재 이름을 보거나 변경하고자 할 경우에 이름을 입력합니다.

텍스트 스타일

주석의 텍스트 스타일을 정합니다.

주석의 텍스트 스타일을 정하고자 할 때는 '평면도 보기'에서 [편집 / 스타일]을 선택합니다. 여기에서 '<레이어 기준 >' 옵션을 선택하면 그 텍스트 스타일은 주석이 추가되는 레이어의 텍스트 스타일 설정에 의해 결정됩니다.

레이어의 기본값을 설정하고자 할 경우에는 '평면도 보기'에서 [편집 / 레이어]를 선택합니다.

포인트 주석 배향

필요로 하는 포인트 주석 배향을 입력합니다. 00�00'00" 과 360�00'00" 사이의 어떤 배향도 사용할 수 있습니다. 기본값은 90�00'00"입니다.

레이어

위치	이 옵션은 특정 레이어에 주석을 위치시키고자 할 때 사용합니다. 주석은 기존 레이어의 목록에서 선택하거나 새로운 레이어 이름을 입력할 수 있습니다. 새로운 레이어 이름을 입력할 경우에는 템플리트가 적용될 때 레이어가 자동으로 만들어집니다.

현재 레이어에 위치

이 옵션은 현재 레이어에 주석을 위치시키고자 할 때 사용합니다. 현재 레이어는 '평면도 보기'의 [레이어 선택] 도구와 [레이어] 대화 상자에서 표시됩니다.

주석이 달린 개체의 레이어에 위치

이 옵션은 주석이 달린 개체의 레이어에 주석을 위치시키고자 할 때 사용합니다.


[주석 템플리트] 대화 상자 - [포인트] 탭
    [주석 템플리트] 대화 상자 − [포인트] 탭

 개요 및 추가 정보

템플리트를 사용하여 포인트에 주석을 다는 경우 포인트의 주석을 정의하기 위해 [포인트] 탭을 사용합니다.

이 기능을 이용하려면,

1.	[삽입 / 주석]을 선택합니다.

2.	[템플리트]를 클릭합니다.

3.	[새로 만들기] 또는 [편집]을 클릭합니다.

4.	[포인트] 탭을 선택합니다.

[왼쪽], [걸침], [오른쪽], [부동]의 4 위치에 입력하는 주석 텍스트는 각 위치 별로 최대 100 문자 및 숫자까지 입력이 가능합니다. 각 위치의 값은 사용자 정의 텍스트와 필드 코드로 이루어져 있습니다. 필드 코드는 데이터베이스로부터 주석의 내역을 가져올 때 사용합니다. 예를 들어 필드코드 '[이름]' 은 그 이름을 가진 포인트에 주석을 다는 데 사용됩니다 - 이 경우 주석은 그 포인트의 오른 쪽에 위치합니다.

포인트에 주석을 다는 것은 상기 4 기본 위치 중 어떤 조합으로도 가능합니다. 기본 위치로부터 주석을 이동시키고자 할 때는 마우스를 이용하여 주석을 좀 더 적당한 곳으로 끌고 갑니다. 이 때에도 주석은 여전히 포인트와 연결 상태를 유지합니다.

위치	주석이 나타나는 곳

왼쪽	  포인트의 왼쪽

걸침	  포인트 위치

오른쪽	  포인트의 오른쪽

부동	  포인트와 떨어진 곳, 그러나 포인트와 링크되어 있는 위치


[주석 템플리트] 대화 상자 - [선] 탭
    [주석 템플리트] 대화 상자 − [선] 탭

템플리트를 사용하여 선에 주석을 다는 경우 선의 주석을 정의하기 위해 [선] 탭을 사용합니다.

이 기능을 이용하려면,

1.	[삽입 / 주석]을 선택합니다.

2.	[템플리트]를 클릭합니다.

3.	[새로 만들기] 또는 [편집]을 클릭합니다.

4.	[선] 탭을 선택합니다.

주석 텍스트는7개 위치(아래 참조)의 각각에 최대 100 자까지의 문자 및 숫자의 입력이 가능합니다. 각 위치의 값은 사용자 정의 텍스트와 필드 코드로 이루어져 있습니다. 필드 코드는 데이터베이스로부터 주석의 내역을 가져올 때 사용합니다. 예를 들어 필드 코드 '[방위각]'은 그 방위각 값 (이 경우에는 선의 가운데 위에)을 가진 선에 주석을 달 때 사용하며  필드 코드 '[거리]'는 그 거리 값 (이 경우에는 선의 가운데 아래에)을 가진 선에 주석을 달 때 사용합니다.

선에 주석을 다는 것은 7개 기본 위치 중 어떤 조합으로도 가능합니다. 기본 위치로부터 주석을 이동시키고자 할 때는 마우스를 이용하여 주석을 좀 더 적당한 곳으로 끌고 갑니다. 이 때에도 주석은 여전히 선과 연결 상태를 유지합니다.

위치	주석이 나타나는 곳

왼쪽 위	선의 왼쪽 끝 위

가운데 위	선의 가운데 위

오른쪽 위	선의 오른쪽 끝 위

왼쪽 아래	선의 왼쪽 끝 아래

가운데 아래	선의 가운데 아래

오른쪽 아래	선의 오른쪽 끝 아래

부동	선과 떨어진 곳, 그러나 선과 링크되어 있는 위치


[주석 템플리트] 대화 상자 - [호] 탭
    [주석 템플리트] 대화 상자 − [호] 탭

템플리트를 사용하여 호에 주석을 다는 경우 호의 주석을 정의하기 위해 [호] 탭을 사용합니다:

이 기능을 이용하려면,

1.	[삽입 / 주석]을 선택합니다.

2.	[템플리트]를 클릭합니다.

3.	[새로 만들기] 또는 [편집]을 클릭합니다.

4.	[호] 탭을 선택합니다.

주석 텍스트는7개 위치(아래 참조)의 각각에 최대 100 자까지의 문자 및 숫자의 입력이 가능합니다. 각 위치의 값은 사용자 정의 텍스트와 필드 코드로 이루어져 있습니다. 필드 코드는 데이터베이스로부터 주석의 내역을 가져올 때 사용합니다. 예를 들어 필드 코드 '[길이]'는 그 길이 값 (이 경우에는 호의 가운데 위에) 을 가진 호에 주석을 달 때 사용하며  필드 코드 '[반지름]'은 그 반지름 값 (이 경우에는 호의 가운데 아래에)을 가진 호에 주석을 달 때 사용합니다.

호에 주석을 다는 것은7개 기본 위치 중 어떤 조합으로도 가능합니다. 기본 위치로부터 주석을 이동시키고자 할 때는 마우스를 이용하여 주석을 좀 더 적당한 곳으로 끌고 갑니다. 이 때에도 주석은 여전히 호와 연결 상태를 유지합니다.

위치	주석이 나타나는 곳

왼쪽 위	호의 왼쪽 끝 위

가운데 위	호의 가운데 위

오른쪽 위	호의 오른쪽 끝 위

왼쪽 아래	호의 왼쪽 끝 아래

가운데 아래	호의 가운데 아래

오른쪽 아래	호의 오른쪽 끝 아래

부동	호와 떨어진 곳, 그러나 호와 링크되어 있는 위치


[포인트] 명령

이 명령은 데이터베이스에 새로운 포인트를 삽입할 때 사용합니다.

이 명령은 [삽입 / 포인트]를 선택하여 실행합니다.

[포인트 삽입] 대화 상자가 나타납니다.


프로젝트에 개체 추가하기

Trimble Geomatics Office 상에서 프로젝트에 개체를 추가할 수 있습니다. 개체란 포인트, 선, 호, 곡선, 주석 또는 텍스트를 의미합니다. 이러한 모든 종류의 개체는 '평면도 보기'에서 [삽입] 메뉴를 이용하여 추가할 수 있습니다. '측량 보기'에서도 [삽입] 메뉴를 이용하여 포인트를 추가할 수 있습니다.

각 개체 종류에 대한 좀 더 자세한 정보는 다음의 링크를 이용합니다:

  포인트

  선

  호

  주석

  텍스트


 [현재 관측치에 대한 선 작업] 명령

이 명령은 선택된 관측치 종류에 CAD 선 작업을 하는 데 사용합니다. 이 기능을 이용하려면 '평면도 보기'에서 [삽입 / 현재 관측치에 대한 선 작업]을 선택합니다.

[현재 관측치에 대한 선 작업 삽입] 대화 상자가 나타납니다.


 [현재 관측치에 대한 선 작업 삽입] 대화 상자

이 대화 상자는 프로젝트에서 모든 관측치에 대한 CAD 선을 만드는 데 사용합니다.

이 대화 상자를 불러오려면 '평면도 보기'에서 [삽입 / 현재 관측치에 대한 선 작업] 명령을 실행합니다.

관측치 종류

이는 관측치 종류를 표시합니다. 가능한 종류는 다음과 같습니다.

RTK 벡터
후처리 벡터	Static, FastSstatic 및 후처리 Kinematic
비GPS 관측치	광파, 레이저 거리계 및 축소 변환
CAD 레이어

해당 관측치 종류에 선을 추가하고자 할 경우에 레이어를 선택합니다. 선택한 레이어의 기본 선 스타일을 이용하여 선이 그려집니다. 키보드를 이용하여 새 레이어를 입력하면 [새 레이어] 대화 상자가 나타납니다.


프로젝트 등록 정보 - 개요
프로젝트 등록 정보 − 개요

추가 정보

방법…	대화 상자

개요

프로젝트의 등록 정보에는 그 프로젝트 전체에 적용되는 모든 설정이 들어 있고 (예를 들어, 좌표계 및 표시단위), 언제든지 이를 변경할 수 있습니다. 프로젝트 등록 정보를 변경하면 그 프로젝트는 변경된 내용으로 업데이트 됩니다. 일부 등록 정보를 변경하면 이는 프로젝트 데이터까지 변경하기 때문에 (예를 들어 좌표계 변경), 기존의 데이터를 변경하게 하는 프로젝트 등록 정보는 변경시 주의를 요합니다.

등록 정보는 일단 변경하면 취소할 수 없습니다.


[프로젝트 등록 정보] 대화 상자

이 대화 상자를 이용하여 프로젝트 전체에 적용되는 기본 설정을 합니다.

이 기능을 이용하려면:

  파일 / 프로젝트 등록 정보를 선택합니다.

[프로젝트 등록 정보] 대화 상자에는 다음과 같은 탭들이 있습니다.

  좌표계

  보고서

  프로젝트 내역

  재계산

  단위와 포맷

  피쳐


[프로젝트 등록 정보] 대화 상자 - [프로젝트 내역] 탭
 [프로젝트 등록 정보] 대화 상자 − [프로젝트 내역] 탭

이 탭을 이용하여 보고서와 플롯에 포함시키고 싶은 프로젝트(템플리트)에 관한 데이터를 입력합니다.

이 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[프로젝트 내역] 탭을 선택합니다.

참조: [프로젝트 내역] 난에서 마우스의 오른쪽을 클릭하면 바로가기 메뉴가 나오며 이를 사용하여 이름 변경], 기존 항목 삭제 또는 새 항목 삽입 등을 할 수 있습니다.

이 탭에 있는 모든 필드는 임의 사항입니다.

제목

이 필드에 현재 프로젝트(템플리트)의 제목을 입력합니다.

설명

필요 시 프로젝트(템플리트)의 설명을 입력합니다.

참조

프로젝트 참조번호를 입력해서 프로젝트를 사무실 비용 산정 작업과 연계할 수 있습니다.

현장 측량자

필요 시, 프로젝트의 현장 작업을 측량자의 이름을 입력합니다.

컴퓨터 조작원

필요  시 프로젝트의 컴퓨터 조작원의 이름을 입력합니다.

날짜

시스템의 일자를 프로젝트 개시일로 기록할 수 있습니다.  이는 템플리트 프로젝트의 날짜 필드에 있는 날짜 코드로 자동처리  됩니다.

수직 데이텀

수직 데이텀의 이름을 입력합니다.

장비

장비의 일련 번호를 입력합니다.

참조: 템플리트가 열려 있을 때에는 필드 코드 정의가 확장되지 않습니다. 이 기능을 이용해 템플리트 안에 적절한 필드 코드 정의를 입력할 수 있습니다. 프로젝트를 처음으로 열 때에는 필드 코드 정의를 확장할 수 있습니다.


[프로젝트 등록 정보] 대화 상자 - [좌표계] 탭
[프로젝트 등록 정보] 대화 상자 − [좌표계] 탭

 개요 및 추가 정보

이 탭을 이용하여 프로젝트의 좌표계를 선택하고 봅니다.

이 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택합니다.

좌표계 설정

현재 좌표계 설정의 요약이 이 상자에 나타납니다.  프로젝트 사이트, 좌표계, 존, 데이텀 및  지오이드 모델이 나타납니다.

[변경] 단추를 누르면 [좌표계 선택] 대화 상자 가  열립니다. 이 대화 상자는 마법사의 첫 페이지로서 좌표계를 설정할 때 사용합니다.

참조: 좌표계를 새로 만들고 편집할 때는 Trimble Coordinate System Manager 유틸리티를 사용합니다.

로컬 사이트 설정

이 상자에는 사이트의 위치가 요약되어 나타납니다. 여기에는 프로젝트의 위도, 경도, 타원체고 및 좌표 표시 방법이 나타납니다.

[변경] 단추를 누르면 [로컬 사이트 설정] 대화 상자. 가 열립니다. 이 대화 상자에서 프로젝트 위치를 바꿀 수 있고, 지상좌표 이용 여부를 명시할 수 있습니다.

자세히�

이 단추를 누르면 [좌표계 내역] 대화 상자가 나타납니다. 이 대화 상자는 현재 좌표계의 투영법, 데이텀 변환, 조정, 지오이드 모델 및 로컬 사이트의 모든 매개 변수를 보여줍니다.

프로젝트에서 GPS 사이트 캘리브레이션을 실행할 경우에는, 기초 좌표계와 GPS 사이트 캘리브레이션 (수평조정 및 수직조정) 매개 변수의 조합이 좌표계 내역이 됩니다 .

망 조정을 실행할 경우에는 매개 변수가 조정치로 쓰입니다.

좌표계는 사이트 캘리브레이션이나 망 조정 변환 매개 변수 중 어느 한 쪽만 취하며, 양 쪽을 다 취할 수는 없습니다.

사이트로 저장

이 단추를 누르면 [사이트로 저장] 대화 상자.가 열립니다. 이 대화 상자를 사용하여 (현재의 GPS 사이트 캘리브레이션을 포함한) 좌표계 내역을 정의된 하나의 사이트로 좌표계 데이터베이스에 저장합니다.

정의된 사이트에 한번 이름을 부여한 다음에는 차후 프로젝트에서 이를 정의된 좌표계로 활용할 수 있습니다.  사이트를 편집할 때는, Trimble Coordinate System Manager 유틸리티를 쓰십시오.

참조: 망 조정 매개 변수는 이 사이트에 저장되지 않습니다.


[좌표계 내역] 대화 상자  - [투영법] 탭
[좌표계 내역] 대화 상자 − [투영법] 탭

이 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택하고, [자세히�] 단추를 누릅니다. [좌표계 내역] 대화 상자가 나타납니다.

3.	[투영법] 탭을 선택합니다.

투영법 매개 변수를 보고자 할 때 이 탭을 씁니다. 투영법의 종류(예를 들어, Transverse Mercator 또는Lambert)이 나타납니다. 투영법의 종류에 따라  필드가 다르게 나타납니다.

[남 방위각] 필드는 방위각의 기준을 말해 줍니다.  대다수의 국가들은 북쪽을 방위각 기준 (북=0�)으로 하지만, 남아 공화국이나 하와이 등지에서는 남쪽을 방위각 기준 (남=0�)으로 합니다. 이 상자는 상기 방법을 쓰는 지역에서 좌표계를 정의할 때 사용하며, 좌표계 마법사로 투영법 매개 변수를 설정할 때, 또는 Trimble Coordinate System Manager� 유틸리티로 남 방위각 좌표계를 정의할 때 사용합니다.

좌표의 정방향 옵션은 좌표가 증가하는 방향을 의미합니다.


[좌표계 내역] 대화 상자 - [데이텀 변환] 탭
[좌표계 내역] 대화 상자 − [데이텀 변환] 탭

 기타

이 탭의 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택하고, [자세히�] 단추를 누릅니다. [좌표계 내역] 대화 상자가 나타납니다.

3.	[데이텀 변환] 탭을 선택합니다.

데이텀 변환 매개 변수를 보고자 할 때 이 탭을 사용합니다. 이 탭은 WGS-84 타원체로부터 로컬 타원체로 변환될 때, 사용된 변환방법 및 매개 변수를 보여줍니다. 로컬 타원체 매개 변수는 로컬 타원체 상자에 나타납니다.

데이텀 변환 옵션은 다음과 같습니다:

  Molodensky법  (3매개 변수법)

  7매개 변수법

  다중 회귀법

  데이텀 그리드법

다음 표는 각 옵션에서 사용할 수 있는 필드를 나타냅니다.


[좌표계 내역] 대화 상자 - [조정] 탭
[좌표계 내역] 대화 상자 − [조정] 탭

이 탭의 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택하고, [자세히�] 단추를 누릅니다. [좌표계 내역] 대화 상자가 나타납니다.

3.	[조정] 탭을 선택합니다.

조정 매개 변수를 볼 때 이 탭을 사용합니다. 조정은 사이트 캘리브레이션이나 망 조정 변환 매개 변수의 형식을 취하고 다음의 측량 데이터에 적용됩니다:

  계산된 GPS 사이트 캘리브레이션

  Survey Controller (*.dc) 파일에서 가져온 캘리브레이션

  사이트 정의

  망 조정 (망 조정 모듈이 설치되어 있는 경우)

참조: 캘리브레이션 [수직 조정] 상자에 있는 [경사N]과 [경사E] 필드는 100 만분의 1단위(ppm)로 표시됩니다.


[좌표계 내역] 대화 상자 - [지오이드 모델] 탭
[좌표계 내역] 대화 상자 − [지오이드 모델] 탭

이 탭의 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택하고 [자세히�] 단추를 누르면 [좌표계 내역] 대화 상자가 나타납니다.

3.	[지오이드 모델] 탭을 선택합니다.

지오이드 모델 내역을 보고자 할 때 이 탭을 사용합니다. 이 탭은GPS 위치의 표고를 정하는 데 쓰인 모든 지오이드 모델 및 정의된 지오이드 모델 파일 이름을 보여줍니다.

참조: 지오이드 모델의 질을 보고자 하면 [프로젝트 등록 정보] / [재계산] 탭을 사용합니다.


[좌표계 내역] 대화 상자 - [로컬 사이트] 탭
[좌표계 내역] 대화 상자 − [로컬 사이트] 탭

로컬 사이트 내역을 보려면 이 탭을 사용합니다.

이 탭의 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택하고 [자세히�] 단추를 누르면 [좌표계 내역] 대화 상자가 나타납니다.

3.	[로컬 사이트] 탭을 선택합니다.

이 탭은 다음과 같은 내용을 보여줍니다.

  프로젝트 위치의 위도, 경도, 타원체고

  지상좌표 이용에 대한 내역, 즉 지상축척 계수, X 좌표 상수 옵셋, Y 좌표 상수 옵셋


[로컬 사이트 설정] 대화 상자

[로컬 사이트 설정] 대화 상자로 프로젝트 위치를 편집하고, 프로젝트에서  지상 좌표 의 이용여부를 지정합니다.  이 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택합니다.

3.	[로컬 사이트 설정] 상자에서 [변경]을 누릅니다.

프로젝트 위치

프로젝트의 중심에 있는 한 점을 사용하여 이 상자에 프로젝트 위치를 정의합니다. 프로젝트 위치는 그리드, 로컬, WGS-84 좌표로 정의될 수 있습니다.

참조: 그래픽 창에서 위치를 정하여 그리드 좌표를 입력할 수도 있습니다.

프로젝트 시작 시 프로젝트 위치를 정의해서 소프트웨어가 연산할 때 그 정보를 사용하게 해야 합니다. 그 정보는 다음과 같습니다:

  지구 반경 계산을 위한 프로젝트 위도

  그리드 축척 계수 정의를 위한 프로젝트의 위도와 경도

  표고 계수를 연산하기 위한 표고 기본값으로서의  프로젝트고

좌표계가 정의되어 있지 않으면 [기본 투영법 정의] 대화 상자가 나타납니다. [지상 좌표 이용] 옵션을 선택하기 전에 원점 위도와 원점 경도를 입력합니다.

지상 좌표 이용

프로젝트에서 지상 좌표를 이용하고자 할 때 이 확인란을 선택합니다.  하지만, 그에 앞서 프로젝트의 좌표계와 위치를 먼저 정의해야 합니다.

이 확인란이 선택이 되면 [지상 좌표 이용] 상자에 있는 모든 항목을 사용할 수 있게 됩니다. [프로젝트 위치] 확인란에 있는 축척 계수 계산 항목은 [로컬 사이트 설정] 대화 상자를 처음부터 다시 사용하면 공란으로 변합니다.

참조: [프로젝트 위치] 상자에서 X 좌표, Y 좌표 및 표고 필드를 입력하여야만  소프트웨어가 [지상 축척 계수]를 연산할 수 있습니다.

참조: GPS 사이트 캘리브레이션을 수행하는 중 [지상 좌표 이용] 확인란을 선택하면, 프로젝트에서 정의한 캘리브레이션이 무효가 됩니다. 작업을 계속하면 캘리브레이션이 삭제될 것이라는 경고 메시지가 나타납니다.

지상 좌표 표시

[지상 좌표 표시] 옵션으로 Trimble Geomatics Office 프로젝트의 지상 좌표 표시 방법을 변경할 수 있습니다.  이렇게 변경함으로써 투영법 좌표와 지상 좌표를 구분하기가 한결 용이해 질 것입니다.  다음 중 하나를 선택합니다.

  X 좌표 옵셋 / Y 좌표 옵셋 - 표시된 좌표계에 옵셋을 추가

  4자리 숫자 좌표 - 4 자리 숫자를 지상 좌표에 표시. 예를 들어, 프로젝트 좌표가 264150.000이라면, 지상 좌표는 4510.000으로 표시.

  5 자리 숫자 좌표 - 5 자리를 지상 좌표에 표시. 예를 들어, 프로젝트 좌표가 264150.000이라면, 지상 좌표는 64510.000으로 표시.


[사이트로 저장] 대화 상자

현재의 좌표계를 하나의 사이트로 저장합니다.

이 기능을 이용하려면:

1.	[ 파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자 가 나타납니다.

2.	[사이트로 저장]을 누릅니다.

사이트 이름

저장된 사이트 정의에 사용할 사이트 이름을 입력합니다.

확인

[확인]을 눌러 사이트를 저장합니다. 사이트가 좌표계 데이터베이스에 저장됩니다. 저장한 모든 사이트는 Trimble Coordinate System Manager� 유틸리티의 [사이트] 탭에 나타납니다. 이 사이트 정의를 향후 프로젝트의 좌표계 정의로 사용할 수 있습니다.

팁: Coordinate System Manager 유틸리티를 사용할 때, [사이트] 탭을 누르면 사이트가 청색으로 나타납니다.

참조: 조정 변환 매개 변수를 사이트로 저장할 수는 없습니다.


[프로젝트 등록 정보] 대화 상자 - [ 단위와 포맷] 탭
[프로젝트 등록 정보] 대화 상자 − [단위와 포맷] 탭

이 탭으로Trimble Geomatics Office 전체 (예를 들어, 화면 출력, 가져오기, 내보내기 및 보고서 작성)에 사용되는  단위 값 을 설정합니다.

이 기능을 이용하려면:

1.	[ 파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자 가 나타납니다.

2.	[단위와 포맷] 탭을 선택합니다.

좌표

좌표 (X 좌표와 Y 좌표)값의 표시 단위를 설정합니다. International feet, Link, 미터, US survey feet 또는 Namibian meter를 선택할 수 있습니다.

표고 / 타원체고

표고의 표시 단위를 설정합니다. International feet, Link, 미터, US survey feet, 또는 Namibian meter를 선택할 수 있습니다.

좌표 소수 자리

좌표에 나타낼 소수 자리 수를 설정합니다. 최대 5 자리까지 지정할 수 있습니다..

좌표 순서

좌표의 순서를 설정합니다. [N 먼저] 또는 [E먼저]를 선택할 수 있습니다.

커서 표시 좌표의 종류

커서표시 좌표의 위치를 선택합니다. 그리드, 로컬 위도 경도, WGS 위도경도 의 옵션이 있습니다.

거리

거리 표시를 설정합니다. Chain, International feet, International mile, 킬로 미터, Link, 미터, US survey feet, 또는 Namibian meter의 옵션이 있습니다..

거리 소수 자리

거리 표시의 소수 자리 수를 설정합니다. 최대 5 자리까지 지정할 수 있습니다.

표시 거리

표시될 거리의 유형을 설정합니다. 다음의 옵션이 있습니다:

  타원체 거리 (해수면 거리)

이것은 (타원체고 0에서의) 기준 타원체면에서 계산된 두 데이터베이스 지점(포인트) 사이의 거리를 말합니다.

  그리드 거리

이것은 두 끝점의 투영 좌표 사이의 피타고라스 거리를 말합니다. 즉, 투영 조정을 적용하지 않으며, 투영 축척 계수를 그 선에 적용하지 않음을 의미합니다.

  지상 거리

이것은 타원체에 평행하는 거리로서, 타원체 위의 평균 타원체고에서 계산됩니다. 즉, 수학적으로 계산된 타원체 거리가 두 끝점 사이의 평균 타원체고로 조정된 것을 말합니다.  지상 좌표를 사용했을 경우, 그리드 거리는 지상 거리와 같아야 합니다. 다음과 같이 표시됩니다:

여기에서

H	: 데이터베이스고

R	: 지구 반경

DE	: 타원체 거리

면적

면적 표시 단위를 설정합니다. 에이커, 헥타르, 제곱 피트 및 제곱 미터의 옵션이 있습니다.

면적 소수 자리

면적 표시의 소수 자리 수를 설정합니다.  최대 5 자리까지 지정할 수 있습니다.

각도 단위

모든 수평 방향과 방위각에 쓰이는 각도 단위를 설정합니다.  도(Degree), Grad, Mil의 옵션이 있습니다.

각도 포맷 (도)

도(°)로 표시된  각도나 방위각의 포맷을 설정합니다. 다음 옵션이 있습니다:

  DDD.dddd	소수 도

  DDDMM'SS	도, 분, 초

  DDDMM'SS.s	도, 분, 소수 초

  DDDMM.mm	도, 소수 분

각도 포맷 (grads/mils)

grad나 mil로 표시된 각이나 방위각의 포맷을 설정합니다. 3 소수 자리, 4 소수 자리 또는 5 소수 자리의 옵션이 있습니다.

방위각 포맷

방위각 값의 포맷을 설정합니다.  다음의 옵션이 있습니다:

  사분각 (N6207'40"W 형태로 표시)

  전각원 (29752'20" 형태로 표시)

WGS-84 표시 형식

WGS-84 표시 옵션을  L,L,H  또는 X,Y,Z.로 설정합니다. 이 설정은, Trimble Coordinate System Manager� 유틸리티로  어떤 포인트를 삽입하거나 포인트의 좌표를 편집할 때, 등록 정보 창에 WGS-84 좌표를  표시하는 방식을 결정합니다. 이 설정은 또한, 사용자 정의 가져오기, 보고서, 또는 내보내기 등의 WGS-84 값을 가지는 포맷을 작성하는데 사용됩니다.

위도, 경도 포맷

위도와 경도 값의 포맷을 설정합니다. 다음의 옵션이 있습니다:

  DDD.ddddddddd	소수 도

  DDDMM'SS.sssss	소수 초

  DDDMM.mmmmmmm  소수 분

축척 포맷

축척 값의 표시와 해석을 설정합니다.  다음의 옵션이 있습니다:

  1" : X 피트  	영국표준 측정단위

  1:X	미터 측정단위

천 단위 분리기호 표시

천 단위 분리기호 표시를 설정합니다.

'예' 또는 '아니오'의 옵션이 있습니다. '예'를 선택하면, Microsoft Windows 시스템에 설정되어 있는 천 단위 분리기호가 수치 값에 적용 됩니다.  자세한 정보는 Microsoft Windows의 제어판에서 [국가별 설정]을 참조 하십시오.

참조: 이 표시 설정이 '예'로 되어 있으면 가져온 ASCII 파일에서  천 단위 분리기호를 기대하며 내보낸 ASCII 파일과 보고서에도 사용됩니다.  이로 인해 파일 가져오기를 수행하지 못 할 수도 있고, 내보낸 파일의 포맷이 예상과 다를 수 있습니다. (예를 들어, 천 단위 분리기호로 콤마를 쓰는  수치 값을 지닌 콤마 구분형 파일을 생각할 수 있습니다.) 포맷 정의에서 필드 코드 변경자를 "표준" 으로 하여, 수치 값 처리를 천 단위 콤마 분리기호 대신 항상 소수점이 되게 할 수 있습니다.

단위 표시

등록 정보 창과 상태 표시줄에 좌표 단위의 표시 여부를 결정합니다.  기본 설정은 '예' 입니다.

공백값 표시 형식

공백 값 표시를 설정합니다.

자동 포인트 시작 이름

자동 포인트 번호 매김의 이름을 설정합니다.  이 값은 소프트웨어로 좌표를 만들거나 추가할 때 쓰입니다. 포인트 이름은 자동으로 한 숫자씩 증가합니다.

경사도 포맷

경사도의 포맷을 설정합니다. RoadLink 에 사용되며, 옵션으로 백분율과 비율이 있습니다.

측면 경사도 포맷

RoadLink에 사용되며, 옵션으로 백분율과 비율이 있습니다

비율 단위

RoadLink에서 쓰이는 비율 포맷의 순서를 설정합니다. 옵션으로 [높이:밑면]과 [밑면:높이]가 있습니다. 예를 들어, [높이:밑면]은 1:100 비율로 표시되고, [밑면:높이]는 100:1 비율로 표시될 수 있습니다.

스테이션 포맷

RoadLink의 전반에 걸쳐 적용되는 스테이션 값의 표시 포맷을 설정합니다. 포맷 옵션은 다음과 같습니다:

  1000.0

  10+00.0

  1+000.0

  1/000.0

체적 단위

RoadLink에서 쓰이는 체적 단위를 설정합니다. 옵션으로는 세제곱 미터, 세제곱 피트 및 세제곱 야드가 있습니다.

GPS 시간 표시 형

시간 표시 포맷을 결정합니다. 옵션으로는 '로컬 시간', 'GPS 시간', 'UTC 시간'이 있습니다.


[프로젝트 등록 정보] 대화 상자- [보고서] 탭
[프로젝트 등록 정보] 대화 상자 − [보고서] 탭

이 탭을 이용하여 프로젝트용 보고서 형식을 설정합니다.

이 기능을 이용하려면:

1.  [파일 / 프로젝트 등록 정보]를 선택하면, [프로젝트 등록 정보] 대화 상자 가 열립니다.

2.  [보고서] 탭을 선택합니다.

생성 보고서 보기

[생성 보고서 보기] 옵션은 데이터 가져오기, 재계산, 피쳐 코드 처리 등의 작업으로 작성한 모든 보고서의 형식을 제어합니다. 위의 작업을 할 때에는 언제나 보고서가 만들어지고, 프로젝트 보고서 폴더 안의 해당 폴더에 저장됩니다.

다음의 옵션은 보고서 처리작업 시 보고서의 출력을 제어합니다.

항상	모든 처리에 대한 보고서가 항상 표시됩니다�처리 중 오류나 경고가 발생하지 않았을 때에는, 표제와 처리에 관련된 정보만을 담은 보고서가 표시됩니다.
오류 발생시	처리과정에서 오류가 발생하면, 오류의 내역을 포함하는 처리 과정에 대한 보고서가 자동적으로 나타납니다.
오류 발생시 확인하기	처리과정에서 오류가 발생하면 경고가 나타나 오류발생 사실을 알리고 그 오류의 내역이 실린 보고서가 나타납니다.
안봄	처리과정에서 발생한 오류에 대해 경고하지 않고, 오류 내역이 실린 보고서가 나타나지 않습니다.
항상 확인하기	어떤 처리를 하였든 간에 항상 보고서를 보도록 합니다.


[프로젝트 등록 정보] 대화 상자 - [재계산] 탭
[프로젝트 등록 정보] 대화 상자 − [재계산] 탭

이 탭을 이용하여 프로젝트의 재계산 설정을 설정합니다.

이 기능을 사용하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 열립니다.

2.	[재계산] 탭을 선택합니다.

복수의 사이드샷 관측치

이 상자를 이용하여 재계산 시 여러 번에 걸쳐 관측된 사이드샷 포인트의 위치를 정하는 방법을 지정합니다. 사이드샷 포인트는 다음을 가지지 않습니다:

  포인트로부터의 관측치

  기준 좌표

   포인트로의 Static 또는 FastStatic 관측치

최적 관측치 이용

재계산을 이용하여 사이드샷 포인트로의 관측치를 평균 계산하고 싶지 않을 경우 이 옵션을 선택합니다. 이 경우, 포인트의 최적 관측치를 이용해 위치를 결정합니다. 이 옵션은 기본 설정으로 선택되어 있습니다.

같은 종류의 관측치를 평균계산(GPS, 광파, 축소변환 레이저)

재계산을 이용하여 같은 종류의 관측치로부터 도출한 좌표를 평균 계산할 때 이 옵션을 선택합니다. 재계산은 절대 서로 다른 종류의 관측 방법을 사용한 좌표를 평균계산 하지 않습니다. 예를 들어, 광파 관측 방법에 의한 좌표를 절대로 GPS 관측에 의한 좌표와 함께 평균하지 않습니다. 단지 사이드샷 포인트만  평균계산 합니다.

허용편차 확인

재계산 과정 중 허용편차를 사용하고자 할 때 이 확인란을 선택합니다.  [같은 종류의 관측치를 평균 계산] 옵션이 선택되었을 때, 재계산은 허용편차를 사용하여 평균좌표를 구합니다.

측량, 맵핑, 미지 등급의 포인트에 대해 허용편차를 설정할 수 있습니다.

허용편차 값을 이용해 복수의 좌표나 관측치를 가지는 한 포인트에  폐합오차를 표시하는 시기를 정합니다. 모든 관측치와 좌표에서 도출한 좌표가 허용편차 밖에 있을 경우에는 폐합오차가 보고되고, 그 포인트에 경고 깃발이 나타납니다. 허용오차 밖의 오류 메시지가 등록 정보 창/ 경고 페이지에 표시됩니다.

수평

어떤 위치의 수평 구성 요소의 허용편차 값을 입력합니다.

수직

어떤 위치의 수직 구성 요소의 허용편차 값을 입력합니다.

비 GPS 관측치를 타원체 기준으로 축소변환 (해수면 보정)

재계산 중에 광파 방법으로 관측된 거리를 타원체를 기준으로 보정하려 할 때 이 확인란을 선택합니다.

데이터베이스에 저장되어 있는 현장 거리 측정치에 해수면 보정이 이미 적용되었다는 모르면, 또는 입력된 좌표가 그리드 좌표가 아니라 지상 좌표라는 것을 모르면, 해수면 보정을 적용해야 합니다. 이 보정이 적용되어 있지 않은 상태에서 광파 데이터가 해수면 위 상당한 타원체고에서 수집된다면 계산 좌표는 정확하지 않게 됩니다.

해수면 보정은 GPS 데이터에는 적용하지 않는데, 이는 데이터가 항상 WGS-84 타원체의 관점에서 수집되기 때문입니다.

참조: GPS 측정치와 비GPS 측정치를 결합하고 있다면 반드시 관측치를 타원체 기준으로 축소 변환하여야 합니다.

참조: [단위와 포맷] 탭 에서 [표시거리] 옵션을 사용하여, 두 데이터베이스 포인트간 거리의 표시 방법을 제어할 수 있습니다.  이 옵션을 [지상 거리]로 설정하면, 측정된 지상거리의 수평 구성요소가 실제 무엇인지 볼 수 있습니다.

추가 정보는 해수면 보정을 참조하십시오.

지오이드 모델의 질

프로젝트에서 사용된 지오이드 모델의 등급을 선택합니다. 만일 지오이드 모델이 5쟭 내외의 정확도를 가진다면 매핑 등급을 선택합니다.  지오이드 모델이 측량 등급의 정확도를 가진다면, 측량 등급 옵션을 선택합니다. 재계산은  지오이드 모델에서 도출한 (GPS 포인트) 표고의 등급이나 (비 GPS 포인트) 타원체고의 등급을 결정할 때 이 등급을 사용합니다. 프로젝트의 좌표계에서 지오이드를 사용하지 않으면 이 필드는 이용할 수 없습니다.


[프로젝트 등록 정보] 대화 상자 - [피쳐] 탭
[프로젝트 등록 정보] 대화 상자 − [피쳐] 탭

이 탭을 이용하여 프로젝트의 피쳐 및 속성을 설정합니다.

이 기능을 이용하려면:

1.	[파일 / 프로젝트 등록 정보를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[피쳐] 탭을 선택합니다.

가져오기 작업시 피쳐 코드

[가져오기 작업시 피쳐 코드]  확인란을 선택하면, 장치 파일을 가져올 때 피쳐코드가 자동으로 처리됩니다. 원하는 피쳐 및 속성 라이브러리를 선택해서 자동으로 피쳐 코드를 처리합니다.

참조: 이 옵션을 선택했다 하더라도, 나중에 [평면도 보기]에서 [도구] 메뉴를 사용하여 피쳐 코드를 처리할 수 있고, 특정 피쳐 및 속성 라이브러리를 선택해서 사용할 수도 있습니다. (여기서  선택한 라이브러리를 반드시 사용할 필요는 없습니다.)

라이브러리

사용하기를 원하는 피쳐 및 속성 라이브러리의 이름을 입력하거나  [찾아보기]를 눌러 이를 찾습니다. [피쳐 코딩] 확인란을 선택하지 않은 경우에는 이 필드를 사용 수 없습니다.

속성 이용

속성을 위한 프로젝트(혹은 템플리트)를 설정하고자 할 때 [속성 이용] 확인란을 선택합니다.

이 필드는 속성 정의를 위해 사용한 라이브러리만을 가르킵니다.

라이브러리

라이브러리를 선택하려면, [라이브러리] 필드에 경로와 이름을 입력하거나 [찾아보기]를 클릭합니다.

찾아보기

이 단추를 클릭하여 원하는 데이터 딕셔너리 (*.ddf) 파일이나 피쳐 및 속성 라이브러리 (*.fcl) 파일의 위치를 찾습니다. 기본 폴더는 Trimble Geomatics Office의  시스템 폴더입니다.

데이터베이스 상에서 피처가 들어있는 포인트가 없으면, 프로젝트와 연관된 피쳐 및 속성 라이브러리를 변경할 수 있습니다.

하지만, 일단 속성이 있는 Survey Controller (*.dc) 파일을 가져오거나, 등록 정보 창을 이용하여 속성을 추가하면, 속성을 위한 프로젝트를 설정할 때 사용한 피쳐 및 속성 라이브러리를 변경할 수 없습니다. 이는 프로젝트의 속성 데이터에 일관성을 기하기 위한 것입니다.


Trimble Geomatics Office 소프트웨어 파일 - 개요
Trimble Geomatics Office 파일 − 개요

사용자의 컴퓨터에 설치한 Trimble Geomatics Office에는 시스템 및 각 프로젝트에 관한 다양한 설정이 저장되어 있는 여러 파일들이 포함되어 있습니다.

경고: 꼭 필요할 경우 외에는  이 파일들을 편집하지 마십시오. 오류를 유발해서 Trimble Geomatics Office가 예상대로 작동하지 않을 수도 있습니다. 이 파일을 편집하고자 할 경우에는, 먼저 백업본을 만드십시오.

이 파일들은 다음의 부문으로 나누어져 있습니다:

Trimble 파일

이 파일은 Program Files\Common Files\Trimble 폴더에 있습니다:

  Current.csd.

  Antenna.ini

  Receiver.ini

Trimble Geomatics Office 시스템 파일

이 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 있습니다:

  Asciiexp.dat

  Asciiimp.dat file

  Asciirpt.dat

  Html files

  Symbols.sym

  Linetype.ltp

  Default.fcl

  Frm files

프로젝트 파일

이 파일은 각 프로젝트의 루트 디렉터리에 있습니다. (통상적으로 C:\Trimble Geomatics Office\ Projects \<프로젝트 이름>:

  Options.ini


Options.ini 파일

 기타

Options.ini 파일은 각 프로젝트와 관련되어 있습니다. 이 파일은 프로젝트 이름 폴더에 위치하고, 등록 정보 창이나 포인트 요약 및 보고서 표제에 나타나는 데이터를 제어합니다.

Options.ini 파일은 다음의 세 부문으로 나눠져 있습니다:

  [요약]

  [보고서]

  [라벨]

요약 정의 설정

Options.ini 파일에 있는 요약 정의로, 포인트가 선택될 때 상태표시 줄에 나타나는 포인트 내역을 지정하고, 또한 어느 포인트 위에 마우스 포인터를 위치할 때 표시되는 도구팁(ToolTip)을 지정할  수 있습니다. 기본설정으로 [이름] : [피쳐 코드]로 설정되어있어, 이름과 피쳐 코드가 함께 요약된 포인트를 얻을 수 있습니다.

포인트가 요약될 때 포인트 이름과 포인트 스타일의 사이를 '/'로 분리하기를 선호한다면, Options.ini 파일의 [요약] 항을 아래와 같이 정의합니다:

Point=[이름]/[포인트 스타일]

또한 선, 호, 곡선 및 텍스트 개체 용으로 구체적인 요약을 할당할 수 있습니다. 예를 들어, 어떤 선의 요약으로 방위각과 거리가 보고되기를 원할 경우, [요약] 섹션에 다음의 정의를 추가합니다:

Line=Az: [방위각] Dist: [거리]

요약 명세에 필드 코드와 함께 텍스트도 포함시킬 수 있습니다.

기본설정으로, 선, 호, 곡선의 요약은 콤마로 분리 표시되는 시작점과 끝점의 포인트 요약으로 구성되어 있습니다.

보고서 표제 설정

[보고서] 섹션은 표준 보고서 표제를 지정하며,  이  표제는 [$Report.Heading]라 불리는 단일 필드 코드를 이용해서 작성한 모든 보고서에 들어갈 수 있습니다. 텍스트와 필드 코드를 혼합해 보고서 표제를 구성할 수 있습니다. '\n'기호를 이용해 새 행이 시작할 곳을 나타냅니다. 이렇게 하여 표제를 다수의 행으로 쪼갤 수 있습니다. 예를 들어 회사 이름을 표준 보고서 표제에 넣을 수도 있습니다.

라벨 옵션 설정

[라벨] 섹션을 이용하여 [라벨] 대화 상자 에 나타나는 새로운 라벨 옵션을 추가할 수 있습니다.

필드 코드와 텍스트를 혼합사용해서 라벨 정의를 정의할 수 있습니다. 문자 '|' 를 써서 각 라벨 옵션을 구분하고, 또한 라벨 옵션의 이름과 실제 라벨로 표시된 텍스트를 구분합니다. 예를 들어, 라벨 옵션의 끝 부분 바로 뒤에 다음 사항을 키보드로 입력합니다:

|설명|[설명]

이와 같이 하여 [설명]이라고 부르는 라벨 대화 상자에 새 라벨 옵션을 추가합니다.  이를 선택하면, 라벨이 붙는 각 포인트는 해당 설명 필드 값을 표시하게 됩니다.

참조: 선, 곡선 또는 호의 라벨 옵션은 정의할 수 없습니다.


TGO_v160.mdb 파일

 기타

경고: Trimble Navigation Limited는 Trimble사 소유의 Trimble Geomatics Office를 이용하여 본 데이터베이스를 사용하고 수정한 경우에만 지원을 합니다. Trimble 사는 다른 응용 소프트웨어에 의한 본 데이터베이스의 사용 또는 수정을 지원(또는 승인) 하지 않고, 그 성능을 보증하지도 않습니다. Trimble사는 이 데이터베이스의  포맷을 수시로 바꿀 수 있으며 그 결과 다른 소프트웨어 응용프로그램과 호환이 불가능할 수도 있습니다.

각 프로젝트에는 TGO_v160.mdb라는 이름의 Microsoft Access 데이터베이스 파일 (*.mdb)이 들어 있습니다. 이 파일은 프로젝트 폴더에 있습니다. 이 파일에는 테이블과 질의를 포함한 모든 프로젝트 데이터가 들어 있습니다. Microsoft Access (Access 2000 또는 그 후 버전)을 사용하시면 다음 작업을 하실 수 있습니다:

  프로젝트 데이터 보기

  사용자 질의 만들기


TGO_v160.dbs 파일

새로 만든 Trimble Geomatics Office 프로젝트를 처음으로 닫을 때, 데이터베이스 스키마 (*.dbs) 파일이 만들어집니다. 이 파일은 Microsoft Access 데이터베이스 (*.mdb)파일에 근거합니다.

.dbs 파일과 .mdb 파일은 모두 프로젝트 루트 폴더에 위치합니다.

사용자 정의 질의를 데이터베이스에 추가할 때에는 그 질의를 만드신 후 이 .dbs 파일을 삭제해야 합니다.

다음에 이 프로젝트를 열면, 새 질의가 들어있는 새로운 .dbs 파일이 만들어지고 그 질의는 이용 가능하게 됩니다.


Antenna.ini 파일

이 파일에는 Trimble Geomatics Office에서 이용 가능한 GPS 안테나가 들어 있습니다.  이 파일은 다른 Trimble 소프트웨어에서도 쓰입니다.


Receiver.ini 파일

이 파일에는 이용 가능한 수신기 목록이 들어 있습니다. 이 파일을 편집해서는 안됩니다.


Asciiexp.dat 파일

이 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 위치합니다. 이 파일에는 Trimble Geomatics Offic에 쓰이는 모든 ASCII 포맷과 사용자 정의 내보내기 포맷이 들어있습니다.  [내보내기] 대화 상자를 이용할 때마다 이 파일을 읽어 들입니다.

이 기능을 이용하려면, 다음 중 하나를 실행합니다:

  내보내기 도구 [image] 를 선택합니다.

  [파일 / 내보내기]를 선택합니다.

아래 부호는 포맷이 어느 탭에 나타나는가를 보여줍니다. 이 파일에는 ASCII 정의만 포함되어 있습니다:

부호	탭
=	측량
+	CAD/ASCII
*	GIS
없음	사용자

[사용자] 탭에 있는 포맷만 편집할 수 있습니다. 따라서, [CAD/ASCII] 탭에서 사용 가능한 포맷을 편집할 때에는, 포맷 정의의 첫 부분에 있는 플러스 부호(+)를 제거하십시오.

예를 들어, Asciiexp.dat 파일에 다음과 같은 행이 포함되어 있습니다:

+SDRmap 좌표

이 포맷을 편집 가능한 포맷으로 만들려면, 플러스 부호 (+)를 제거합니다.

다음에 [내보내기] 대화 상자를 이용하면, 이 포맷이 [사용자] 탭에 나타나고 [편집]  단추를 사용할 수 있게 됩니다.

유사한 방식으로, 사용자 정의 포맷을 편집 불가능한 포맷으로 바꾸려 할 때에는 위의 부호 중 하나를 포맷 이름의 첫 부분에 삽입하면 됩니다.

예를 들어, Asciiexp.dat 파일에 다음과 같은  행이 포함되어 있습니다:

구분형 포인트

이 행을 다음과 같이 바꿉니다:

+구분형 포인트

다음에 [내보내기] 대화 상자를 이용하면, 이 포맷이 [CAD / ASCII] 탭에 나타나고 [편집] 단추는 사용할 수 없게 됩니다.


Asciiimp.dat 파일

이 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 위치합니다.  이 파일에는 Trimble Geomatics Office에서 쓰이는 모든 ASCII 포맷과 사용자 정의 가져오기 포맷이 들어있습니다.  [가져오기] 대화 상자를 이용할 때마다 이 파일을 읽어 들입니다.

이 기능을 이용하려면 다음 중 하나를 실행합니다:

  [가져오기] 도구 [image] 를 선택합니다.

  [파일 / 가져오기]를 선택합니다.

다음 부호는 포맷이 나타나는 탭을 표시합니다. 이 파일에는 ASCII 정의만 포함되어 있습니다:

부호	탭
=	측량
+	CAD / ASCII
없음	사용자

[사용자] 탭에서 사용할 수 있는 [가져오기] 포맷만 편집할 수 있습니다. 따라서, [CAD / ASCII] 탭에 있는 포맷을 편집하고자 할 때는 포맷정의 첫 부분에 있는 플러스 부호 (+)를 제거하십시오.

예를 들어, Asciiimp.dat 파일에 다음과 같은 행이 포함되어 있습니다:

+WILDsoft 포맷

이 포맷을 편집 가능한 포맷으로 바꾸려면, 플러스 부호 (+)를 제거하면 됩니다.

다음에 [가져오기] 대화 상자을 이용하면, 포맷이 [사용자] 탭에 나타나고 [편집]  단추를 이용할 수 있게 됩니다. 유사한 방식으로, 사용자 정의 포맷을 편집 불가능한 포맷으로 바꾸려 할 때에는 위의 부호 중 하나를 포맷 이름의 첫 부분에 삽입하면 됩니다.

예를 들어, Asciiimp.dat 파일에 다음과 같은  행이 포함되어 있습니다

구분형 포인트

이 행을 다음과 같이 바꿉니다:

+구분형 포인트

그 다음 [가져오기] 대화 상자를 이용하면, 이 포맷이 CAD/ASCII 탭에 나타나고 [편집] 단추는 사용할 수 없게 됩니다.


 Asciirpt.dat 파일

이 파일은 Program Files\Trimble\Trimble Geomatics Office\시스템 폴더에 위치합니다. 여기에는 Trimble Geomatics Office에서 쓰는 모든 데이터베이스 보고서 포맷이 들어 있습니다. 기타 보고서를 이용 할 때마다 이 파일을 읽어 들입니다.

[기타 보고서] 대화 상자를 사용하려면, [보고서 / 기타 보고서]를 선택합니다:

[기타 보고서] 대화 상자에서 모든 시스템 데이터베이스 포맷을 편집 가능한 포맷으로 바꾸려면, 파일의 포맷 이름에서 등호 (=)를 제거하면 됩니다.

예를 들어, Asciirpt.dat 파일에 다음과 같은 행이 포함되어 있습니다:

=포인트

이 포맷을 편집 가능한 포맷으로 바꾸려면, 등호 (=)를 제거하면 됩니다.

그러면 포맷이 [기타 보고서] 대화 상자에 나타나고 편집이 가능하게 됩니다. 유사한 방식으로, [기타 보고서] 대화 상자로부터 사용자 정의 포맷을 편집 불가능한 포맷으로 바꿀 때에는 등호(=)를 포맷 이름의 첫 부분에 삽입하면 됩니다.

예를 들어, Asciirpt.dat 파일에 다음과 같은 행이 포함되어 있습니다.:

고정너비 포인트 리스팅

이 행을 다음과 같이 바꿉니다:

= 고정너비 포인트 리스팅

그러면 포맷이 [기타 보고서] 대화 상자에 나타나고 편집이 불가능하게 됩니다.


.html 파일

다수의 템플리트 HTML (.html) 파일이 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 설치되어 있습니다. 이 템플리트를 사용해서 시스템 보고서를 작성합니다. 이 파일을 삭제하시면 안됩니다.

Trimble Geomatics Office로 만든 보고서(예를 들어, Recompute.html) 는 해당 프로젝트의 보고서 폴더에 저장됩니다. .html 보고서를 열려면, Microsoft Windows 탐색기에서 해당 보고서를 더블 클릭합니다.  그러면 기본으로 설정된 HTML 뷰어 내에서 그 파일이 열립니다.

참조: .html 파일을 수정해서, 시스템 보고서에 나타나는 정보를 사용자 정의로 만들 수 있습니다. 하지만, Trimble사는 수정된 .html파일의 정상적인 작동을 지원 (또는 보증)하지 않습니다. 당Trimble사에서는 .html 파일을 변경하기 전에 백업을 하시기를 권장합니다.


Symbols.sym 파일

심벌.sym 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 위치합니다.

Line Type Editor 유틸리티를 사용하여 이 파일을 보고 편집합니다. 이 파일에는 부호가 들어 있습니다. Trimble Geomatics Office나 Feature and Attribute Editor 유틸리티에서, 이 파일에 있는 부호를 이용하여 새로운 포인트 스타일을 만들어 낼 수 있습니다.

또한 사용자의 .sym 파일을 만들 수도 있습니다.  .sym 파일의 사용에 관한 자세한 정보는 Trimble Geomatics Office의 사용자 안내서에서 유틸리티 편을 참조하십시오.


Linetype.ltp 파일

선형식.ltp 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 위치합니다. 이 파일을 보고 편집할 때에는 Trimble Line Type Editor� 유틸리티를 사용하십시오.

이 파일에는 선 형식들이 들어 있습니다. Trimble Geomatics Office나 Feature and Attribute Editor 유틸리티에서, 이 파일에 있는 선형식을  이용하여 새로운 선 스타일을 만들어 낼 수 있습니다.

또한 사용자의 .ltp 파일을 만들 수도 있습니다.   .ltp 파일의 사용에 관한 자세한 정보는 Trimble Geomatics Office의 사용자 안내서에서 유틸리티 편을 참조하십시오


Default.fcl 파일

Default.fcl 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 위치합니다. 이 파일을 보고 편집할 때에는 Trimble Feature and Attribute Editor� 유틸리티를 사용하십시오. .fcl 파일은 모두 피쳐 및 속성 라이브러리입니다.

이 파일에는 사전 정의된 피쳐 코드 (속성을 가진  또는 속성이 없는 상태), 포인트 스타일, 선 스타일, 주석 스타일 및 제어 코드가 포함되어 있습니다.

이 파일을 사용하시려면:

1.	피쳐 코드 정보를 수집하기 위하여 이 파일을 Trimble Survey Controller로 전송 합니다.

2.	Trimble Geomatics Office에서 이 파일을 사용하여 피쳐 코드를 처리하고, 또 속성정보를 수집할 경우, 속성을 위한 프로젝트 설정을 합니다.

Feature and Attribute Editor 유틸리티를 이용하여 사용자의 피쳐 및 속성 라이브러리를 만들 수 있습니다.  피쳐 및 속성 라이브러리 만들기에 관한 자세한 정보는 Feature and Attribute Editor의 도움말을 참조하십시오.


Current.csd 파일

Current.csd 파일은 Program Files\Common Files\Trimble\Geodata 폴더에 위치합니다.

Current.csd는 Trimble Geomatics Office용 좌표계 데이터베이스 입니다.

 이 파일은 프로젝트의 좌표계를 선택할 때 사용됩니다.

이 파일을 보고 편집하려면 Trimble Coordinate System Manager� 유틸리티를 사용하십시오.  새 좌표계 만들기에 관한 정보는 Trimble Coordinate System Manager의 도움말을 참조하십시오.


.frm 파일

도면 양식 템플리트가 .frm 파일로 저장됩니다. 이 파일은 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 위치합니다.

인쇄나 플롯를 위해 시트설정을 할 때 반드시 사용할 도면 양식 을 선택해야 합니다.

참조: .frm 파일은 텍스트 파일입니다.  이 파일을 보고 편집하려면 텍스트 편집기를 사용하십시오.


마이크로소프트 액세스 2000
Microsoft Access 2000

경고: Trimble Navigation Limited는 Trimble사 소유의 Trimble Geomatics Office 소프트웨어를 이용하여 본 데이터베이스를 사용하고 수정한 경우에만 지원을 합니다. Trimble 사는 다른 응용 소프트웨어에 의한 본 데이터베이스의 사용 또는 수정을 지원(또는 승인) 하지 않고, 그 성능을 보증하지도 않습니다. Trimble사는 이 데이터베이스의  포맷을 수시로 바꿀 수 있으며 그 결과 다른 소프트웨어 응용프로그램과 호환이 불가능할 수도 있습니다.

Trimble Geomatics Office는 Microsoft Access 2000 의 데이터베이스를 이용합니다. 지금 쓰시는 Microsoft Access가 그 이전 버전이면, <프로젝트>.mdb 파일을 열 수 없습니다. Microsoft Access 2000 (또는 이후 버전)을 쓰시면 프로젝트 데이터를 볼 수 있고  새 질의 작성을 할 수 있습니다.


데이터베이스 질의 - 개요
데이터베이스 질의 � 개요

추가 정보

 방법...

경고: Trimble Navigation Limited는 Trimble사 소유의 Trimble Geomatics Office 소프트웨어를 이용하여 본 데이터베이스를 사용하고 수정한 경우에만 지원을 합니다. Trimble 사는 다른 응용 소프트웨어에 의한 본 데이터베이스의 사용 또는 수정을 지원(또는 승인) 하지 않고, 그 성능을 보증하지도 않습니다. Trimble사는 이 데이터베이스의  포맷을 수시로 바꿀 수 있으며 그 결과 다른 소프트웨어 응용프로그램과 호환이 불가능할 수도 있습니다.

개요

Trimble Geomatics Office는 Microsoft Access 2000의 데이터베이스를 사용합니다. Microsoft Access를 사용해서  사용자의  질의를 만들 수 있습니다.

참조: Trimble 사는 사용자가 직접 정의한 질의는 지원하지 않습니다.

여기에서 다룬 내용은 Trimble Geomatics Office에서 사용될 질의 디자인에 관한 제한적인 정보일 뿐입니다. 이 기법을 보다 깊이 검토하시려면, Microsoft Access 구입시에 함께 받으신 책자를 참조하시길 바랍니다.

Microsoft Access의 질의 정의

통상적으로, 프로젝트에서 사용하기 위해  정의하는 질의를 프로젝트 템플리트에 사전에 정의해 둘 수 있습니다.

Microsoft Access의 다른 데이터베이스로 질의 정의를 내보낼 수도 있습니다. 따라서, 어떤 특정 프로젝트에서 유용한 질의 정의를 만들었다면, 이 정의를 메인 프로젝트 템플리트로 내보내어 다른 Trimble Geomatics Office 프로젝트에서도 사용 가능하게 할 수 있습니다.

Trimble Geomatics Office에서 Microsoft Access의 질의를 사용하는 관건은 질의에서 지정된 ID 필드가 해당 질의에 의해 선택되는 개체 유형을 정의한 다는 데 있습니다.

선택 질의에서 ID 필드 사용에 관련된 두 가지 조건이 있습니다.

 첫 번째 출력 열 ( 열에서 [표시] 확인란 선택) 이나 전체 테이블(* 옵션 사용)이  ID 필드가 되도록 질의에서 정의해야 합니다.

 다수의 개체 유형을 선택 ( 예를 들어, [호] 개체와 연관된 모든 포인트 선택 ) 하기위해 질의를 디자인 한다면, 선택될 각 개체와 관련된ID 필드가 그 질의에서 유일한 출력필드가 되야 합니다.

Trimble Geomatics Office의 질의 정의

Trimble Geomatics Office에서 사용될 질의를 정의하려면, 반드시 질의 이름에 정확한 선행 문자를 붙여, 원하는 목록에 그 질의가 나타날 수 있도록 해야 합니다.

참조: 보고서와 내보내기 질의에서 선택집합 데이터 테이블이 질의 이름에서 참조되어야 합니다.  예를 들면, 포인트 목록을 내보내기 할 때, 그 질의의 이름은 '내보내기(포인트)_포인트 목록'으로 되어야 합니다.

선택할 목적으로 질의를 만들어 이를 [선택 / 질의기준] 목록에 나타내려고 하면, 그 질의에 반드시 선행 문자 [선택부분_] 을 첨가해야 합니다.  선행 문자 [선택부분_] 이 있는 질의는 사용자 정의 보고서를 작성할 때에도 사용할 수 있습니다.

보고서 목적으로만 질의를 디자인 할 때에는, 보고서(선택집합 데이터 테이블)의 선행 문자를 씁니다. 보고서(선택집합 데이터 테이블)의 선행 문자가 있는 질의는 [선택 / 질의 기준] 목록에 나타나지 않습니다.

질의를 추가해서 등록 정보 창 선택 목록에서 항목을 필터링 하기 원하면, 선행 문자SS_ 를 씁니다. 등록 정보 창에서 [필터] 도구를 누르면 질의가 목록에 나타납니다.


 Microsoft Access의 질의에 매개 변수 전달

경고: Trimble Navigation Limited는 Trimble사 소유의 Trimble Geomatics Office 소프트웨어를 이용하여 본 데이터베이스를 사용하고 수정한 경우에만 지원을 합니다. Trimble 사는 다른 응용 소프트웨어에 의한 본 데이터베이스의 사용 또는 수정을 지원(또는 승인) 하지 않고, 그 성능을 보증하지도 않습니다. Trimble사는 이 데이터베이스의  포맷을 수시로 바꿀 수 있으며 그 결과 다른 소프트웨어 응용프로그램과 호환이 불가능할 수도 있습니다.

Microsoft Access 소프트웨어에서는  서로 다른 때에 별개의 개체를 선택하는 데 사용자 정의의 동일한 질의를 이용할 수 있게 하기 위해서 매개 변수를 질의 정의의 일부분으로 지정할 수 있습니다.

매개 변수가 지정되면 질의가 시작되었을 때 Trimble Geomatics Office로 적절한 값을 입력할 수 있습니다. 질의에서  매개 변수 이용의 예를 들자면, 피처 코드 별로 포인트 개체를 선택하기 위해 질의를 사용하는 경우입니다.

예를 들어, 어느 시점에 피쳐 코드가 '나무'인 모든 포인트를 선택하고, 그 후 어느 시점에 피쳐 코드가 '포스트'인 모든 포인트를 선택할 수 있습니다.

질의 정의에서 어떤 열에 매개 변수를 지정하려면 [조건] 필드에 표시하기를 원하는 프롬트(prompt)를 충족시킬 비교조건 (즉, =, >, <, Like)과 함께 모난 괄호 (즉, [ ])  속에 입력하면 됩니다.

예를 들어,  피쳐 코드 별 포인트 선택을 위한 질의의 경우,  [피쳐 코드] 필드가 질의 정의에 반드시 추가되어야 합니다.  [조건] 필드에는 다음의 예와 같이 충족시킬 조건이 반드시 정의되어야 합니다 : "Like [코드]".

위의 예에서 [Like] 스트링 비교 연산자는 일치하는 코드를 찾는데 사용됩니다.

질의 매개 변수의 지정에 더욱 세부 조건을 설정할 수도 있습니다. 이 경우, 그래픽 모델의 개체를 클릭하여 Trimble Geomatics Office의 매개 변수 필드에 입력할 수 있습니다. 세부조건 정의를 할 때에는 매개 변수 프롬트 다음에 콜론을 넣고 그 다음에  데이터베이스 필드의 이름을 넣습니다. 위의 코드 예는 다음과 같이 변하게 됩니다:
Like [코드:피쳐 코드]

[조건] 필드에서 매개 변수의 조건을 정의하는 것 외에도 질의를 위한 대화 상자에서 매개 변수의 정의를 입력해야 합니다.  포인터를 질의 대화 상자의 상부에 위치하면, 바로가기 메뉴로부터 대화 상자가 나타납니다.

참조: [매개 변수] 필드에는 [조건]필드의 모난 괄호에 입력된 텍스트와 동일한 텍스트가 있어야 합니다.

각 매개 변수의 [데이터유형]필드는 입력될 데이터 형에 따라 달리 설정됩니다. 위의 예에서는, 피쳐 코드가 텍스트 타입 필드이므로  [텍스트]로 설정됩니다. 만일 포인트 타원체고와 같은 실수 유형의 매개 변수가 지정된다면, [데이터 형] 필드는 [더블]로 설정되어야 합니다.

여기에서 다룬 내용은 Trimble Geomatics Office에서 사용될 질의 디자인에 관한 제한적인 정보일 뿐입니다. 이 기법을 보다 깊이 검토하시려면, Microsoft Access 구입시에 함께 받으신 책자를 참조하시길 바랍니다.


선택 집합  필터링에 사용자 정의 질의 사용
선택 집합의  필터링에 사용자 정의 질의 사용

경고: Trimble Navigation Limited는 Trimble사 소유의 Trimble Geomatics Office 소프트웨어를 이용하여 본 데이터베이스를 사용하고 수정한 경우에만 지원을 합니다. Trimble 사는 다른 응용 소프트웨어에 의한 본 데이터베이스의 사용 또는 수정을 지원(또는 승인) 하지 않고, 그 성능을 보증하지도 않습니다. Trimble사는 이 데이터베이스의  포맷을 수시로 바꿀 수 있으며 그 결과 다른 소프트웨어 응용프로그램과 호환이 불가능할 수도 있습니다.

Microsoft Access를 사용해서 [선택 집합 데이터] 테이블과 함께 작업할 수 있는 보다 복합적인 질의를 만들 수 있습니다. 이는 선택 질의로 하여금 데이터베이스 선택집합을 효과적으로 필터링 할 수 있게 합니다.

[선택집합 데이터] 테이블에는 해당 선택집합에 있는 모든 개체의 레코드ID가 들어 있습니다.

이와 같은  필터링이  제대로 기능을 발휘하기 위해서는, 선택될 개체를 포함하고 있는 테이블 (예를 들어, [포인트] 테이블)과 더불어, [선택집합 데이터] 테이블이 반드시 질의 정의 내에 포함되어 있어야 합니다. 이와 같은 경우, [선택집합 데이터] 테이블의 [레코드 ID] 필드는 반드시 그 질의에 포함된 다른 테이블에 있는 적절한 ID 필드와 결합되어 있어야 합니다. 이와 같이 두 테이블에 있는 필드를 서로 결합시키려면, 한 테이블의 적절한 필드의 이름을 다른 테이블의 필드 이름 위에 끌어서 놓으면 됩니다.

지금까지 논의했던 다른 선택 질의의 경우와 마찬가지로, 질의에서 나타나는 최초의 필드는 반드시 ID 필드 또는 전체 테이블이어야 합니다.  질의로 특정 테이블의 개체만을 선택하게 하려면, 질의에서 [선택집합 데이터] 테이블로부터 선택될 개체들을 포함하는 테이블 이름을 정의해야 합니다. 다시 말해서, 포인트가 선택되면 [선택집합 데이터] 테이블의 [테이블 이름]필드가 질의에 추가되어야 하고, [조건]필드는 [포인트]로 설정되어야 함을 의미합니다.

[선택집합 데이터] 테이블에는 한 선택집합에 있는 모든 개체의 레코드 ID가 들어있습니다. 각 선택집합에는 고유의 인식번호가 할당되어있는데 이 번호는 [선택집합 데이터] 테이블의 [선택집합 이름 ID] 열에 열거되어 있습니다.  숫자 '0'은 그 개체가 현재의 선택집합의 일원임을 의미하며,  따라서 질의는 이 값을 이용하여 오직 현재 선택집합만을 필터링 되도록 합니다. 이를 위해, [선택집합 이름 ID]를 지정하는 질의에 추가로 한 열을 더하고 [조건] 필드를 0으로 설정합니다. 이 [조건]을 다른 값으로 설정하면, 필요 시 기존의 선택집합에 의거해서 현재의 선택을 할 수 있도록 해줍니다.

여기에서 다룬 내용은 Trimble Geomatics Office에서 사용될 질의 디자인에 관한 제한적인 정보일 뿐입니다. 이 기법을 보다 깊이 검토하시려면, Microsoft Access 구입시에 함께 받으신 책자를 참조하시길 바랍니다.


프로젝트 템플리트 - 개요
프로젝트 템플리트 � 개요

추가 정보

방법�	대화 상자

개요

새 프로젝트를 만들 때는 반드시 템플리트를 선택해야 합니다. 템플리트에는 모든 설정, 데이터 및 파일구조가 들어있습니다. 프로젝트를 새로 만들 때 템플리트에 있는 정보가 프로젝트로 복사됩니다. 예를 들어, Survey Controller (*.dc) 파일이 템플리트의 체크인 폴더에 있다면, 프로젝트의 체크인 폴더에도  똑 같은 .dc 파일이 생깁니다. 반면, 프로젝트의 파일이 편집되어도  템플리트의 파일에는 아무런 변화를  일으키지 않습니다.

템플리트는 다음의 경우 유용합니다:

  사용하고자 하는 CAD 스타일을 선택할 때

  데이터베이스에 기준점을 추가할 때

  필요한 파일을 추가할 때

  적절한 좌표계를 선택할 때

  필요한 단위를 선택할 때

  중복 포인트 설정을 선택할 때

Trimble 사는 Trimble Geomatics Office와 더불어 다수의 템플리트를 제공합니다.  예를 들어, 미터법 템플리트를 사용하면, 그 템플리트로 만든 프로젝트의 모든 측정 단위를 미터법으로 쓸 수 있습니다.

템플리트는 Program Files\Trimble\Trimble Geomatics Office\Template 폴더에 위치합니다.


[재계산 보고서] 명령

재계산 보고서를 보려면 이 명령을 사용합니다. 이 보고서는 가장 최근에 재계산한 측량 데이터로부터 생성됩니다.

이 보고서를 이용하려면 [보고서 / 재계산 보고서]를 선택합니다.

기본 HTM뷰어에 이 보고서가 출력됩니다.


시스템 보고서 - 개요
시스템 보고서 − 개요

 기타

시스템 보고서는 측량 데이터의 처리 작업이나 계산 후 생성됩니다. 보고서 폴더에 이 보고서가 생성됩니다. 가져오기 보고서를 제외하고, 새 보고서가 생성될 때 폴더에 같은 이름의 기존 보고서가 있을 경우 이를 덮어쓰게 됩니다.

처리작업 후 시스템에 의해 자동으로 다음과 같은 보고서가 생성됩니다.

  가져오기 보고서

  재계산 보고서

  피쳐 코드 처리 보고서

  프로젝트 붙여넣기 보고서

이 보고서에 관한 메시지를 원할 경우 [프로젝트 등록 정보] 대화 상자 - [보고서] 탭 의 [생성 보고서 보기] 옵션을 선택합니다

측량 작업을 수행 후 다음과 같은 시스템 보고서를 생성할 수 있습니다. 이 보고서는 측량 계산의 내역 또는 측량 데이터의 변경 사항을 알려줍니다.

  재계산 보고서

  포인트 도출 보고서

  GPS 기선 처리 보고서 (기선 처리 모듈이 설치되어 있을 경우)

  GPS 루프 폐합 보고서

  망조정 보고서 (망조정 모듈이 설치되어 있는 경우)

  GPS 사이트 캘리브레이션 보고서

  좌표 변환 보고서

  표고 조정 보고서

  인버스 보고서

  포인트 이름 변경 보고서

  레벨 보고서

참조: 설치된 모듈 (기선 처리 및 망조정 모듈)에 따라  이용 가능한 보고서가 달라 집니다.


데이터베이스 보고서 - 개요
데이터베이스 보고서 − 개요

 기타

데이터베이스 보고서는 데이터베이스에 정의되어 있는 주 테이블 레코드와 질의로부터 생성된 보고서 입니다. 즉 데이터베이스 보고서는 프로젝트 데이터베이스의 정보를 알려줍니다.

이 보고서는 프로젝트의 요약이 필요할 경우 또는 고객에게 보고서를 제공하고자 할 경우 유용합니다.

데이터베이스 보고서는 다음 두개의 부류로 나눌 수 있습니다.

  시스템 데이터베이스 보고서

  사용자 정의 보고서

[기타 보고서] 대화상자에서 위의 두 종류의 보고서를 이용할 수 있습니다.

Trimble Geomatics Office에서 제공되는 기존 데이터베이스 보고서를 이용하거나 수정할 수 있고 또한 사용자가 직접 그 보고서 포맷을 정의할 수 도 있습니다.


보고서 - 개요
보고서 − 개요

Trimble Geomatics Office에서 생성되는 모든 보고서는 HTML 포맷으로 되어 있습니다. 그리고 사용자의 컴퓨터에 설치되 있는 HTML 뷰어 프로그램에 이 보고서를 보여줍니다.  일반적으로 사용자의 기본값 HTML 뷰어는 웹 브라우저 입니다.

모든 보고서는Trimble Geomatics Office\Projects 디렉토리의 보고서 폴더 내에 생성됩니다. 그리고 해당 보고서 형식의 이름을 가지고 있는 폴더로 분류됩니다. 새 보고서가 생성될 때 폴더에 동일 이름의 기존 보고서가 있을 경우 이를 덮어쓰게 됩니다. 가져오기 보고서 와 망조정 보고서의 경우는 이 사항이 해당되지 않습니다.

두 가지 형식의 보고서를 생성 할 수 있습니다:

  시스템 보고서

  데이터베이스 보고서

[보고서] 메뉴에서 자주 사용되는 보고서를 이용할 수 있습니다. 설치된 모듈 (기선 처리 및 망조정) 에 따라 그리고 보고서가 이미 생성되었느냐에 따라 이용 가능한 시스템 보고서가 달라 집니다.

참조: Trimble Geomatics Office 보고서는 Microsoft Internet Explorer 버전 2 또는 3에서는 볼 수 없습니다. 상기 버전을 가지고 있을 경우 웹에서 Microsoft Internet Explorer 버전 4 또는 5의 설치를 권장합니다.


Microsoft Internet Explorer 웹 브라우저 - 보고서 뷰어
Microsoft Internet Explorer 웹 브라우저 − 보고서 뷰어

HTML 뷰어가 설치되어 있지 않을 경우 웹에서 Microsoft Internet Explorer 웹 브라우저를 다운로드해서 설치할 수 있습니다. Microsoft Internet Explorer 웹 브라우저을 이용하여 생성한 보고서를 보거나 인쇄할 수 있습니다. 보고서 작성 목적에 적합한 다른 유용한 기능도 Microsoft Internet Explorer 웹 브라우저에서 사용할 수 있습니다.

보고서 모양의 사용자 정의

Trimble Geomatics Office의 보고서는 표준화된 포맷으로 출력됩니다. 모든 보고서에 동일한 글꼴, 글꼴 크기, 색상 그리고 배경 화면이 사용됩니다. 사용자가 원하는 값으로 이 설정을 변경할 수 있습니다. 사용자가 더 읽기 쉬운 포맷으로 보고서를 출력하고자 원할 경우 이 기능을 이용합니다.

팁: 보고서의 배경 화면을 변경하려면 보고서 폴더의 backgrnd.gif 파일을 동일한 이름의 원하는 CompuServe Graphics Interchange (GIF) 그래픽 파일로 변경합니다.

인쇄 옵션을 조절하여 인쇄 시 보고서 배경 화면을 출력하지 않도록 설정할 수 있습니다. 기본값으로 이 옵션은 설정 해제되어 있습니다.

다른 응용 프로그램에서 열기

많은 응용프로그램이 HTML 포맷의 문서를 지원합니다. 또한 텍스트 (*.txt) 파일로 보고서를 저장하여 텍스트 편집기, 스프레드시트 또는 워드 프로세서와 같은 다른 응용 프로그램에서 사용할 수 있게 할 수 있습니다. 또한 보고서의 한 부분을 클립보드로 복사하여 다른 응용 프로그램 내로 붙여넣기를 할 수도 있습니다.

이 같은 기능은 다른 응용프로그램에서 문서 내에 보고서를 삽입하고자 할 경우, 보고서의 내용을 수정할 경우, 또는 이 데이터를 이용하여 추가 계산을 수행하고자 할 경우에 유용합니다.

보고서 작성과 관련, Microsoft Internet Explorer의 사용에 관한 더 자세한 정보를 원하면 Internet Explorer 도움말을 참조하십시오.


[보고서 포맷 정의] 대화 상자

보고서 포맷을 정의하려면 이 대화 상자를 사용하십시오.

이 기능을 이용하려면:

1.	[보고서 / 기타 보고서]를 선택합니다.

[기타 보고서] 대화 상자가 나타납니다.

2.	다음 중의 한가지를 실행 합니다:

  새 보고서 포맷을 정의하려면 [새로 만들기]를 클릭 합니다

  보고서 목록에서 기존 보고서 포맷을 선택하고 [편집]을 클릭하여 선택된 포맷을 수정합니다.

참조: 포인트, 표고 범위, 좌표계 내역, 포인트 비교 보고서는 수정할 수 없습니다.

이름

보고서 포맷 이름을 입력합니다. [사용자 정의 보고서] 대화 상자의 [보고서 목록]에 이 이름이 나타납니다. 중복된 이름은 사용할 수 없습니다.

공백값 스트링

[공백값 스트링] 필드는 [파일 / 프로젝트 등록 정보] / [단위와 포맷] 탭 에 설정되어 있는 공백값 스트링을 보여줍니다. 이 필드에 지정된 스트링은 사용자 정의의 생성된 보고서에서 공백값이 있는 필드에도 사용됩니다. 이 필드는 선택 사항입니다.

설명

[설명] 필드에 보고서 포맷의 설명을 입력할 수 있습니다. 상태 표시줄에 이 설명이 나타납니다. 이 필드는 선택 사항입니다.

기본 확장자

기본 확장자는 보고서 포맷의 정의에 사용되지 않습니다.

보고서 작성 대상

보고서의 출처로서 주 테이블이나 질의 중 한가지를 선택합니다. 기본 출처는 포인트 정보  레코드입니다. 이것은 포인트 테이블의 어떤 레코드에 대해서도 보고서를 작성할 수 있도록 해 줍니다.

포맷 자동 구성

헤더와 본문을 자동으로 초기화 시키려면 [포맷 자동 구성]을 클릭 합니다. 자세한 정보는 포맷 자동 구성을 보십시오.

포맷 헤더

보고서 헤더를 구성할 고정 텍스트와 필드 코드 정의 ([바로 가기] 메뉴에서 이용가능)를 입력합니다. 이 필드는 선택 사항으로서 정의지정을 할 필요는 없습니다.

헤더 정의에 빈 줄을 삽입 하려면 Enter키를 누릅니다.

포맷 본문

Trimble Geomatics Office가 프로젝트에서 어떤 데이터를 보고서에 나타낼 것인지 해당 필드코드 정의 ([바로 가기] 메뉴에서 이용가능)를 입력합니다.

예를 들어 고정 너비 포인트 목록 보고서를 출력하려면 다음의 포맷을 사용합니다:

[이름:10][첫째 좌표:14.3][둘째 좌표:14.3][표고:14.3][피쳐 코드:20]

포맷 헤더 또는 포맷 본문은 빈 공간으로 놓아둘 수 있습니다 (둘 다는 안됨).

포맷 바닥글

보고서 바닥글을 구성할 고정 텍스트 및 필드 코드 정의 ([바로 가기] 메뉴에서 이용가능)를 입력 합니다. 이 필드는 선택 사항으로서 정의지정을 할 필요는 없습니다. 예를 들어 EOF (파일 명령의 끝)를 표시하려면 바닥글을 사용합니다.

바닥글 정의에 빈 줄을 삽입하려면 Enter키를 누릅니다.

시스템에서 이용 가능한 모든 필드 코드에 대한 자세한 정보는 필드 코드 - 개요 를 보십시오.


재계산 보고서 - 개요
재계산 보고서 − 개요

재계산 보고서 는 재계산 과정의 결과를 요약해주는 HTML로 되어 있는 보고서입니다.  다음 사항을 수행하여 발생한 경고 플래그를 제거하고자 할 때 재계산 보고서를 사용합니다.

  선점 내역 검사

  포인트 이름이 올바르게 되었는지 검사

  키보드에서 좌표가 부정확하게 입력되었을 가능성이 있을 경우 이 좌표를 불이용 상태로 만듬

  필요할 경우 재 관측

재계산 보고서는 다음사항을 보고서에 포함합니다.

  다중 관측치 결과 또는 좌표 결과가 허용 편차 밖으로 나타날 경우의 허용 오차 (허용 편차는 [프로젝트 등록 정보] 대화 상자의 [재계산] 탭에 지정되어 있음)

  둘 이상의 관측치 또는 키입력한 좌표를 포인트의 계산 위치를 결정하는 데 사용할 경우, 그리고 그 위치가 허용편차 내에 있을 경우의 폐합

  미사용 관측치 및 오차.

  시작 좌표 및 좌표가 도출된 순서.

  보고서에 참조된 관측치 및 좌표.

Trimble Geomatics Office는 재계산을 할 때 마다 재계산 보고서를 생성합니다. [프로젝트 등록 정보] 대화 상자에 있는 [보고서] 탭의 [생성 보고서 보기] 필드의 설정 값에 따라 재계산 보고서 생성 방법의 통보내용이 달라 집니다. 재계산 보고서는 항상 프로젝트의 보고서 폴더에 저장됩니다. 보고서가 이미 존재할 경우 모든 시스템 보고서처럼 기존의 보고서는 새 보고서에 의해 덮어쓰이게 됩니다.

재계산 보고서는 다음과 같은 내용을 포함합니다:

  프로젝트 내역

  오류

  경고

  폐합

  포인트 도출

  시점

  트래버스 보고서

  측량 데이터 (관측치 및 좌표)


재계산 보고서 - 프로젝트 내역 섹션
재계산 보고서 − 프로젝트 내역 섹션

재계산 보고서 의 프로젝트 내역 섹션은 프로젝트 이름 및 좌표계 내역을 요약하여 줍니다.


재계산 보고서 - 오류 및 경고 섹션
재계산 보고서 − 오류 및 경고 섹션

재계산 보고서 의 오류 및 경고 섹션은 하나의 포인트에 대해 둘 이상의 좌표 세트가 도출된 경우, 그리고 해당 좌표가 허용 편차 밖에 있는 경우에 해당되는 모든 포인트를 나열해 줍니다.  또한 이 보고서는 사용되지 않은 관측치와 좌표로 변환할 수 없는 포인트를 보여줍니다.

오류 및 경고를 검사하려면 이 섹션을 이용합니다. 그리고 이 오류 및 경고를 해결하기 위해 프로젝트를 수정하고자 할 경우에 이 섹션을 이용합니다. 포인트의 도출을 보려면 포인트를 클릭합니다. 그러면 [포인트 도출] 섹션으로 연결 됩니다.

또한 수평 및 수직 허용 편차가 나타납니다. 이것은 [프로젝트 등록 정보] 대화 상자 - [재계산] 탭 에 설정되어 있습니다.


재계산 보고서 - 포인트 도출 섹션
재계산 보고서 − 포인트 도출 섹션

재계산 보고서 의 포인트 도출 섹션은 포인트의 계산된 위치를 보여줍니다. 재계산 보고서에 포함되어 있는 포인트 중 오류 또는 폐합을 가지고 있는 포인트에 대해서만 도출이 보고됩니다. 계산된 위치에 대한 수평 요소(X 좌표, Y 좌표), 표고 요소 및 타원체고 요소의 질을 보여 줍니다.

계산된 위치 및 질 아래에 포인트의 좌표 설정에 사용할 수 있는 측량 데이터의 목록이 있습니다.

각 관측치는 다음 사항을 보여줍니다.

  관측치 종류

  관측치 ID

  시점 및 종점

관측치 내역을 보려면 ID를 클릭 합니다. 이 것은 재계산 보고서의 [측량 데이터] 섹션과 링크되어 있습니다.

그래픽 창 (및 등록 정보 창)에서 관측치를 선택하려면 관측치 ID 좌측의 아이콘을 선택합니다. 이 링크는 사용자로 하여금 '측량 보기'에서 허용 편차 밖의 폐합을 가지고 있는 관측치를 쉽게 볼 수 있도록 해줍니다

각 좌표는 다음을 보여줍니다.

  좌표의 형식 (그리드, 측지, 위치해)

  좌표의 출처

  좌표 ID

좌표 내역을 보려면 ID를 클릭 합니다. 이 것은 재계산 보고서의 [측량 데이터] 섹션과 링크되어 있습니다.

다시 그래픽 창 및 등록 정보 창에서 포인트를 선택하려면 관측치 ID 좌측의 아이콘을 선택합니다.

[계산에 사용] 열은 관측치 또는 좌표로부터 어떠한 위치 요소 (NE,e,h) 가 계산되었는지를 보여줍니다. 예를 들어 관측치가 포인트의 X 좌표, Y 좌표 및 타원체고 요소를 결정하고 좌표가 표고를 결정한다면 [계산에 사용] 열은 GPS 관측치 옆에 NEh를, 좌표 옆에는 e를 표시합니다.

델타 X 좌표, 델타 Y 좌표, 델타 표고 및 델타 타원체고 열은 최종 계산된 위치와, 관측치 또는 좌표 만을 사용하여 계산된 위치 간의 차이를 표시합니다.

델타 값이 프로젝트에 설정된 허용 편차 값을 초과 할 경우 플래그가 나타나고 숫자가 적색으로 변합니다. 적색으로 표시된 관측치는 반드시 잘못된 관측치 이거나 키보드로 잘못 입력된 좌표를 가르키는 것은 아닙니다 � 질이 떨어지는 관측치나 입력된 좌표를 이용하여 재계산이 수행되었을 수 도 있습니다. 사용자는 오류의 원인을 찾아내고 질이 떨어지는 관측치를 불이용 상태로 바꾸어 주어야 합니다.

각 관측치를 검사하려면 보고서의 [측량] 섹션을 사용하십시오.

팁: 재계산 보고서에서 보고되지 않은 포인트를 포함해서 프로젝트의 어떤 포인트에 대한 도출 보고서를 보려면 [등록 정보] 창 및 [보고서/포인트 도출 보고서] 명령을 사용할 수 있습니다.


재계산 보고서 - 트래버스 보고서 섹션
재계산 보고서 − 트래버스 보고서 섹션

재계산 보고서 의 [트래버스 보고서] 섹션은 재계산기능이 시점으로부터 어떻게 트래버스하는 지, 그리고 어떤 관측치를 사용하는지를 보여줍니다.

시점에서부터  둘 이상의 레그가 있을 경우만 트래버스가 보고됩니다. 이는 옵셋이 보고되는 일을 방지하기 위함입니다

예를 들어,  관측치가

  시점 1에서 � 포인트 2 - 포인트 3 그리고 다시 시점 1로 되돌아 올 경우, 트래버스 보고서가 생성됩니다.

  시점 1에서 � 포인트 2로 된 경우에는 보고서가 생성되지 않습니다.


재계산 보고서 - 폐합 섹션
재계산 보고서 − 폐합 섹션

재계산 보고서의 [폐합] 섹션은 다중 관측치(프로젝트의 지정 허용 편차 내에 있는)가 있는 스테이션 포인트의 목록을 보여줍니다. 델타 X 좌표, Y 좌표, 표고, 타원체고 열에 해당 포인트의 모든 측량 데이터로부터의 폐합이 표시됩니다.

도출 내역을 보려면 포인트를 클릭합니다. 이것은 [포인트 도출] 섹션에 링크되어 있습니다.


재계산 보고서 - 측량 데이터 섹션
재계산 보고서 − 측량 데이터 섹션

측량 데이터 섹션은 재계산보고서에 표시되는 포인트의 모든 관측치 및 좌표를 보여줍니다. 측량 데이터는 관측치 유형에 따라 분류됩니다. 부정확한 관측치를 결정하고자 할 때 이 섹션을 사용합니다.

재계산 보고서에 참조되어 있는 관측치 및 좌표만 이 섹션에 열거 됩니다.

등록 정보 창에서 모든 측량 데이터를 볼 수 있습니다.


재계산 보고서 - 시점 섹션
재계산 보고서 − 시점 섹션

재계산보고서의 [시점] 섹션은 관측치의 시점이 되는 포인트를 보여줍니다.


재계산 보고서 - 추가 좌표계 내역
재계산 보고서 − 추가 좌표계 내역

[추가 좌표계 내역] 섹션에는 로컬 사이트 설정에 대한 정보가 나옵니다.

로컬 사이트 설정은  [프로젝트 등록 정보] 대화 상자 - [좌표계] 탭에 설정되어 있습니다.


[포인트 도출 보고서] 명령

선택한 포인트에 대한 포인트 도출 보고서를 보려면 이 명령을 사용하십시오.

이 기능을 이용하려면:

1.	보고자 하는 포인트를 선택합니다.

2.	[보고서 / 포인트 도출 보고서]를 선택합니다.

포인트 도출 보고서 가 기본 HTML 뷰어에 표시됩니다.


포인트 도출 보고서

포인트 도출 보고서는 재계산 보고서의 섹션으로 포인트의 계산된 위치를 보여줍니다. 계산된 위치의 수평 (X 좌표, Y 좌표) 요소, 표고 요소 및 타원체고 요소의 질을 보여줍니다.

이 보고서의 포맷은 재계산 보고서의 [포인트 도출] 섹션 과 동일합니다.

이 기능을 이용하려면:

1.	보고자 하는 포인트를 선택합니다.

2.	다음 중의 한가지를 실행합니다.

 [보고서 / 포인트 도출 보고서]를 선택합니다.

  등록 정보 창 / [측량] 탭 / [요약] 페이지를 열어 [포인트 도출] 도구 [image] 을 선택합니다.

이 보고서는 HTML 뷰어에 표시됩니다.

참조: '측량 보기'에서 포인트를 선택하려면 포인트를 클릭하거나 ID 좌측에 있는 관측치 아이콘을 클릭 합니다. 이것은 '측량 보기'에서 포인트로 다시 연결하는데 유용합니다.


[인버스 보고서] 명령

인버스가 계산된 후 [인버스] 대화 상자에서 생성된 가장 최근의 인버스 보고서를 보려면 이 명령을 사용합니다.

이 기능을 이용하려면,

 [보고서 / 인버스 보고서]를 선택 합니다.

이 보고서는 기본 HTML 뷰어에 표시됩니다.


인버스 보고서

인버스 계산 후 인버스 보고서가 생성됩니다. 그리고 이 인버스에 대한 요약 정보, 상세 정보 또는 결합 정보를 표시해 줍니다.

요약 인버스 보고서는 인버스 정의에 사용된 시점과 종점 간의 그리드 방위각, 그리드 거리 및 델타 표고를 보여줍니다.

상세 보고서는 그리드, 로컬 (측지) 및 Cartesian (WGS-84) 좌표계의 시점과 종점의 위치와 계산된 인버스 매개 변수를 보여줍니다.

이 보고서를 생성하려면 [인버스] 대화 상자를 사용하십시오.

보고서가 생성 된 다음에는 보고서 / 인버스 보고서를 선택하여 언제나 가장 최근의 보고서를 볼 수 있습니다.


포인트 이름 변경 보고서

포인트 이름 변경 보고서는 [포인트 이름 변경] 명령을 사용 후 변경된 포인트의 원래 이름과 새 이름을 보여주는 보고서입니다.

이 보고서를 생성하려면 [이름 변경] 대화 상자를 사용하십시오.


가져오기 보고서

파일이 프로젝트로 전송될 때 마다 Trimble Geomatics Office는 가져온 각 파일에 대한 가져오기 보고서를 생성합니다. 이 보고서의 이름은 <가져온 파일 이름.html>이 됩니다. 이 보고서는 다음과 같은 섹션을 포함합니다.

프로젝트 내역

이 섹션에는 프로젝트의 이름과 좌표계 내역이 요약됩니다.

메시지

이 섹션은 가져오기 작업 시 발생한 모든 메시지를 나열해 줍니다. 가져오기 작업 시 어떠한 메시지도 발생하지 않았을 경우 이 섹션은 표시되지 않습니다.

재계산 보고서

이 보고서는 가져오기 과정이 수행 된 후 자동으로 생성된 재계산 보고서의 링크를 포함하고 있습니다. 재계산 보고서는 재계산 처리의 결과를 요약해 줍니다.

피쳐 코드 처리 보고서

이 보고서는 가져오기 작업시 피쳐 코드가 처리되었을 경우 피쳐 코드 보고서의 링크를 포함하고 있습니다.

참조: 재계산 보고서 또는 피쳐 코드 처리 보고서 링크가 적색이면 이는 보고서 처리 중 오류가 있었다는 것을 나타내며, 보고서에 표시됩니다.

가져오기 작업과정 중에 Import.html 라는 이름을 가진 도입 파일 보고서가 생성됩니다. 이 보고서는 프로젝트로 가져온 모든 파일의 목록을 보여줍니다. 다른 세션에서 동일 프로젝트로 가져온 파일은 자동으로 이 보고서에 추가 됩니다.

이 보고서와 관련된 통보방법은 [프로젝트 등록 정보] 대화 상자 - [보고서] 탭에 있는 [생성 보고서 보기] 옵션에서 설정할 수 있습니다.


[기타 보고서] 명령

Trimble Geomatics Office에 의해 제공되는 시스템 데이터베이스 보고서 또는 사용자 정의 보고서를 생성하려면 이 명령을 사용합니다.

이 보고서를 이용하려면 [보고서 / 기타 보고서]를 선택합니다. [기타 보고서] 대화 상자가 나타납니다.


[기타 보고서] 대화 상자

Trimble Geomatics Office에 의해 제공된 시스템 데이터베이스 보고서 또는 사용자 정의 보고서를 생성하려면 [기타 보고서] 대화 상자를 사용합니다. 이 대화 상자를 이용하려면 [보고서 / 기타 보고서]를 선택 합니다.

시스템 데이터베이스 보고서

시스템 데이터베이스 보고서는 현재 프로젝트의 요약을 제공하는 사전 정의된 보고서 포맷입니다. 일반적으로는 이 보고서는 편집할 수 없지만, 보고서 포맷은 편집할 수도 있습니다. 보고서를 편집하려면 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 있는Asciirpt.dat 파일을 수정합니다.

사용자 정의 보고서

사용자 정의 보고서는 사용자의 설정에 따라 데이터베이스에 정의된 주 레코드 형식이나 질의를 사용합니다.

사용자 정의 보고서 포맷을 생성, 정의 또는 편집할 수 있습니다. 그러나 Program Files\Trimble\Trimble Geomatics Office\System 폴더에 있는 Asciirpt.dat 파일을 수정함으로써, 이 보고서 포맷을 수정할 수 없게 할 수도 있습니다.

실행하고자 하는 보고서의 이름 뒤에 생략 부호가 있을 때에는 특정의 정보를 먼저 입력해야 합니다. 예를 들어 표고 보고서의 작성을 실행할 경우 Trimble Geomatics Office는 사용자에게 최소 및 최대 표고를 입력하도록 요구합니다.

보고서 작성 대상

선택된 개체 또는 레코드 종류에 대한 보고서는 두 가지의 옵션을 이용할 수 있습니다:

선택 부분	선택된 개체 또는 선택된 레코드 종류에 대한 보고서를 원할 경우 이 옵션을 선택합니다.
전체 데이터베이스	모든 개체 또는 모든 레코드 종류에 대한 보고서를 원할 경우 이 옵션을 선택합니다.
아무것도 선택하지 않았을 경우 이 단추는 이용할 수 없고 모든 개체나 레코드 종류가 보고서 작성 대상이 됩니다.

참조: 좌표계 내역 보고서를 선택하였을 경우 이 옵션은 이용할 수 없습니다.

데이터 정렬

데이터가 보고되는 순서를 선택할 수 있습니다.

이 기능을 이용하려면:

1.  [데이터 정렬] 확인란을 선택합니다.

2.  목록에서 정렬 순서를 선택합니다. 다음과 같은 정렬 순서를 선택할 수 있습니다:

데이터베이스 순서	표고
이름	질
시작 시간	데이터 형
선점 길이
참조: 동일한 정렬 옵션을 등록 정보 창에서도 이용할 수 있습니다.

팁: 사용자 고유의 정렬 질의를 작성하였을 경우 이것도 이 목록에 표시됩니다.

보고서

[보고서] 상자는 시스템 데이터베이스 또는 사용자 정의 보고서의 목록을 보여줍니다. Trimble Geomatics Office에서 사용할 수 있는 다양한 종류의 보고서가 이미 정의되어 있습니다.

확인

보고서를 생성한 후 기본 HTML 뷰어에 표시합니다.

새로 만들기

새 보고서 포맷을 생성하고 정의합니다.

편집

기존 보고서 포맷을 수정합니다.

삭제

보고서를 삭제합니다. 실행할 지 여부를 확인합니다.

참조: 입력한 분리값은 현재 표시 단위가 아닌 데이터베이스 좌표 단위로 해석됩니다. 데이터베이스 단위는 첫번째 데이터가 데이터베이스에 저장될 때의 표시 단위에 기초하여 설정됩니다.

팁: Program Files\Trimble\Trimble Geomatics Office\System 폴더에 있는Asciirpt.dat파일을 텍스트 편집기로 수정함으로써 이 보고서를 변경할 수 있습니다.


    [GPS 사이트 캘리브레이션 보고서] 명령

캘리브레이션 계산 후 [GPS  사이트 캘리브레이션] 대화 상자로부터 생성된 가장 최근의 GPS 사이트 캘리브레이션 보고서를 보려면 이 명령을 사용합니다.

이 보고서를 이용하려면 [보고서 / GPS 사이트 캘리브레이션 보고서]를 선택합니다.

이 보고서는 기본  HTML 뷰어에 표시됩니다.

참조: 이 명령은 '측량 보기'에서는 이용할 수 없습니다. '측량 보기'에서 GPS 사이트 캘리브레이션 보고서를 이용하려면 [GPS 사이트 캘리브레이션] 대화 상자에서 [보고서]를 클릭합니다.


GPS 사이트 캘리브레이션 보고서

GPS 사이트 캘리브레이션 보고서는 캘리브레이션 계산을 수행한 후 생성됩니다. 이 보고서는 알려진 위치와 각 잔차 값에 비교되는 계산된 포인트 위치의 목록 뿐만 아니라 모든 계산된 매개 변수도 보여 줍니다.

이 보고서를 만들려면 [GPS 사이트 캘리브레이션] 대화 상자 를 사용합니다.


[좌표 변환 보고서] 명령

좌표 변환 계산 후 [좌표 변환] 대화 상자로부터 생성된 가장 최근의 좌표 변환 보고서를 보려면 이 명령을 사용합니다.

이 보고서를 이용하려면 [보고서 / 좌표 변환 보고서]를 선택합니다.

이 보고서는 기본 HTML 뷰어에 표시됩니다.

참조: 이 메뉴 명령은 '측량 보기' 모드에서는 없습니다. '측량 보기'에서 이 보고서를 생성하려면 [좌표 변환] 대화 상자의 [좌표계 변환 보고서 만들기] 확인란을 선택합니다.


좌표 변환 보고서

좌표 변환 보고서는 좌표 변환 계산 후 생성되고 원래의 좌표와 변환된 좌표를 보여 줍니다.

이 보고서를 생성하려면 [좌표 변환] 대화 상자를 사용합니다.

보고서가 생성된 후 '평면도 보기'에서 [보고서 / 좌표 변환 보고서]를 선택함으로써 언제나 가장 최근의 보고서를 볼 수 있습니다.


[표고 조정 보고서] 명령

표고 조정을 수행 후 [표고 조정]대화 상자로부터 생성된 가장 최근의 표고 조정 보고서를 보려면 이 명령을 사용합니다.

이 보고서를 이용하려면 보고서 / 표고 조정 보고서를 선택합니다.

이 보고서는 기본 HTML 뷰어에 표시됩니다.

참조: 이 명령은 '측량 보기'에서는 이용할 수 없습니다(기본값임). '측량 보기'에서 보고서를 생성하려면 [표고 조정] 대화 상자의 [표고 조정 보고서 만들기] 확인란을 선택합니다.


표고 조정 보고서

표고 조정 보고서는 표고 조정이 수행 된 후 생성되고 원래 좌표와 조정된 좌표를 보여줍니다.

이 보고서를 생성하려면 [표고 조정] 대화 상자를 사용합니다.

보고서가 생성된 후 '평면도 보기'에서 [보고서 / 표고 조정 보고서]를 선택함으로써 언제나 가장 최근의 보고서를 볼 수 있습니다.


피쳐 코드 처리 보고서

피쳐 코드 처리 보고서는 피쳐 코드 처리 작업 후에 생성됩니다.

[프로젝트 등록 정보] 대화 상자 - [일반] 탭에서 [생성 보고서 보기] 옵션을 설정함으로써 보고서가 생성되었을 때 관련 통지를 받을 수 있습니다.

이 보고서는 처리 작업의 요약을 나타내주고, 사용된 피쳐 및 속성 라이브러리 (.fcl) 파일의 내역 과 피쳐 코드 처리 중에 발생한 문제를 포함합니다.


프로젝트 붙여넣기 보고서

프로젝트 붙여넣기 보고서는 포인트가 복사된 다음 프로젝트에 붙여넣기 한 후 생성됩니다.

[프로젝트 등록 정보] 대화 상자 - [일반] 탭 에서 [생성 보고서 보기] 옵션을 설정함으로써 보고서가 생성되었을 때 관련 통지를 받을 수 있습니다.

이 보고서는 프로젝트 간의 속성 정의가 다를 경우 복사는 되었으나 붙여넣기 하지 않은 포인트에 지정되어 있는 피쳐 및 속성을 요약해줍니다.


[레벨 보고서] 명령

선택된 파일의 레벨 보고서를 보려면 이 명령을 사용합니다.

이 보고서를 이용하려면:

1.  [보고서 / 레벨 보고서]를 선택합니다.

2.  해당 레벨 파일을 선택합니다.

선택한 레벨 파일의 레벨 보고서는 기본 HTML 뷰어에 표시됩니다.


레벨 보고서

레벨 보고서는 레벨 파일의 레벨 관측치와 데이터를 보여줍니다.

이를 이용하려면:

1.	[보고서 / 레벨 보고서]를 선택합니다.

2.	레벨 파일을 선택합니다.

이 보고서는 기본 HTML 뷰어에 표시되고 다음과 같은 정보를 표시합니다:

레벨 데이터

이 섹션은 레벨 야장 포맷으로 레벨 런을 보여줍니다. 또한  [디지털 레벨 가져오기] 대화 상자에 표시되어 있는 후시, 중시, 전시 관측치 및 계산된 표고 정보를 보여줍니다.

레벨 관측치

레벨 관측치 테이블은 다음의 정보를 보여줍니다.

  ID

  시점

  종점

  질

   Δ 표고 - 스테이션 포인트 사이에서 이 값이 계산됩니다.

팁: 그래픽 창에서 레벨 관측치를 선택하려면 관측치 ID를 선택합니다. 이것은 사용자로 하여금 등록 정보 창에서 레벨 관측치를 쉽게 볼 수 있게 해줍니다.

참조: 레벨 보고서는 <프로젝트 이름>\ Reports\Level 폴더에 저장됩니다.


[모두 선택] 명령

현재 작업 중인 프로젝트의 모든 개체를 선택합니다.

이 명령은 [선택 / 모두 선택]을 선택함으로써 실행합니다.

측량 보기

이 모드 하에서는 보이는 개체만 모두 선택됩니다.

예를 들어, [보기 / 필터] 명령으로써 일부 관측치를 숨긴 상태에서 [선택 / 모두 선택] 명령을 실행할 경우, 숨겨진 관측치는 선택되지 않습니다.

평면도 보기

이 모드 하에서는 다음의 레이어에 있는 개체만 모두 선택됩니다.

  '표시' 속성이 활성으로 설정된 레이어

  '보호' 속성이 해제로 설정된 레이어

예를 들어, 레이어 선택 도구 [image] 로써 어떤 레이어의 '보호' 속성을 활성화한 다음, [선택 / 모두 선택] 명령을 실행할 경우, 보호된 그 레이어의 개체는 하나도 선택되지 않게 됩니다.

팁: 선택된 개체의 수가 상태 표시줄에 나타납니다.


[선택 안함] 명령

선택을 해제하는 명령입니다.

이 명령은 [선택 / 선택 안함]을 선택함으로써 실행합니다.

팁: 선택된 것이 없다는 메시지가 상태 표시줄에 나옵니다.


[포인트] 명령

이 명령을 이용하여 [포인트 선택] 대화 상자를 불러옵니다.

이 명령은 [선택 / 포인트]를 선택함으로써 실행합니다.


[포인트 선택] 대화 상자

개요	방법 ...

이 대화 상자에서 어떤 기준을 지정함으로써 포인트를 선택합니다. 와일드 카드와 범위를 이용할 수도 있고, 여러 탭에서 그 기준을 입력할 수도 있습니다. Trimble Geomatics Office는 이 모든 기준을 충족하는 포인트만 선택합니다.

이 대화 상자는 [선택 / 포인트] 명령을 실행하여 불러옵니다.

'측량 보기' 모드에서 이 대화 상자를 불러오는 경우, Trimble Geomatics Office는 현재 '표시' 상태인 포인트만을 그 선택 대상으로 삼습니다. 즉, [보기 필터] 대화 상자를 이용하여 어떤 관측치를 보이지 않게 해 두었다면 이들은 선택되지 않게 됩니다. '측량 보기'의 경우, 레이어 정보('평면도 보기'에서 나옴)는 선택 기준에서 무시됩니다.

'평면도 보기' 모드에서 이 대화 상자를 불러오는 경우, Trimble Geomatics Office는 현재 '표시' 상태이고, '보호' 상태가 아닌 포인트만을 그 선택 대상으로 삼습니다. '평면도 보기'에서는 '측량 보기'에서 적용된 보기 필터가 모두 무시됩니다.

[포인트 선택] 대화 상자의 탭:

  일반

  GPS

  선점

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


[포인트 선택] 대화 상자 - [일반] 탭
[포인트 선택] 대화 상자 − [일반] 탭

이 탭을 이용하여 일반 포인트 필드의 기준을 입력합니다.

이름 조건 및 피쳐 코드 조건

이름 기준/피쳐 코드 기준에 따라 선택을 합니다. 이름은 콤마로 구분하여 여러 개를 입력할 수 있습니다. 예를 들어, �100,250,1020�이라 입력하면 이름이 각각 100, 250, 1020인 포인트 3개가 프로젝트에서 선택됩니다. 생략 부호(...)나 대시(-)는 그 범위 내의 포인트를 모두 선택한다는 의미로 쓰입니다.

문자와 숫자를 조합한 이름이 포함된 범위 하에서는 뜻밖의 개체가 선택될 수 있는데, 이는 완전한 알파벳순의 정렬이 이용되기 때문입니다.

참조: 범위의 시작과 끝이 숫자인 경우(예: 1000�1005)에는 숫자 범위가 선택됩니다.

이 필드에서 와일드 카드를 이용할 수 있습니다.

참조: 이름에 하이픈이 들어 있는 경우, 그 하이픈을 인용부 안에 두어야 합니다. 예를 들어, 포인트 이름 a-2은 밶-2�로 입력합니다. 그렇지 않으면 a에서 2까지의 범위로 인식됩니다.

와일드 카드 문자가 들어 있는 이름에서 패턴 매칭이 일어나는 것을 방지하려면 이중 인용부를 씁니다. 예를 들어, "URS#1"..."URS#8"라 입력하면 #이 선택 범위의 와일드 카드로 쓰이는 것을 방지할 수 있어, 실제 이름이 URS#1와 URS#8 사이에 있는 포인트가 선택되게 됩니다.

이름은 대문자로 입력하든 소문자로 입력하든 차이가 없습니다.

포인트 등급 조건

목록으로부터 포인트 위치 구성 요소의 질을 선택합니다. 여러 가지의 포인트 등급을 선택할 수 있습니다.

출처 조건

목록으로부터 포인트의 출처를 고르게 되는데, 여러 가지를 선택할 수 있습니다. 선택한 여러 출처의 어느 한가지에만 해당되면, 그 측량 데이터가 있는 포인트는 모두 선택됩니다.

피쳐 코드 조건

포인트 선택에 이용할 피쳐 코드를 입력합니다.

레이어 조건

'측량 보기' 모드에서 이 대화 상자를 불러온 경우에는 이 옵션을 이용할 수 없습니다.

원하는 레이어를 목록으로부터 선택하게 되는데, 여러 개를 고를 수 있습니다. 해당 레이어의 모든 포인트가 선택됩니다.

포인트 스타일 조건

목록으로부터 포인트 CAD 스타일을 고르게 되는데, 여러 가지를 선택할 수 있습니다. 해당 포인트 스타일(등록 정보 창 � [CAD] 탭에서 명시된)에 부합하는 포인트가 모두 선택됩니다.

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


[포인트 선택] 대화 상자 - [GPS] 탭
[포인트 선택] 대화 상자 − [GPS] 탭

GPS 데이터를 이용한 선택 기준을 입력합니다. 이 기준은 후처리나 RTK GPS 기선 양자에 모두 적용됩니다.

어떤 포인트에 기선이 여러 개 있을 경우, 이 설정 기준에 부합하는 기선이 최소한 하나 이상 있으면 그 포인트는 선택됩니다.

수평 정밀도, 수직 정밀도

이하(<=) 단추나 이상(>=) 단추 중에서 설정하고자 하는 기준에 부합하는 부호를 선택합니다.

키보드로써 정밀도 값을 입력합니다.

이 필드는 그냥 물음표 상태로 두면 선택 기준으로 이용되지 않습니다.

해 유형

기준으로 설정할 해 유형을 목록에서 고르게 되는데, 여러 가지를 선택할 수 있습니다. 이 해 유형의 GPS 관측치가 있는 포인트는 모두 선택됩니다.

측량 방식

기준으로 설정할 측량 방식을 목록에서 고르게 되는데, 여러 가지를 선택할 수 있습니다.

참조: 해 유형과 측량 방식을 공히 충족하는 포인트만 선택됩니다.

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


[포인트 선택] 대화 상자 - [선점] 탭
[포인트 선택] 대화 상자 − [선점] 탭

선점 내역을 이용한 선택 기준을 입력합니다. 이 기준에 부합하는 선점이 최소한 하나 이상 있으면 그 포인트는 선택됩니다.

모든 기지국 및 측량기 설정

GPS 기지점과 비GPS 기계점을 모두 선택하려면 이 확인란을 선택합니다.

안테나나 타겟 높이의 범위

안테나 높이나 타겟 높이의 범위를 입력합니다. 첫째 필드의 입력 값은 반드시 둘째 필드의 입력 값보다 작아야 합니다. 입력 값은 포함 개념입니다(즉, 입력 범위가 10 ~ 12라고 할 때, 10 이상/12이하이지 10 초과/12 미만이 아님).

선점 작업 시간

날짜와 시간 범위를 입력하려면 이 확인란을 선택합니다. 시작 시간과 정지 시간이 이 범위 안에 들어오는 것은 모두 선택됩니다. 입력하는 값은 다음에 이 옵션을 이용하는 경우에 대비하여 소프트웨어상에 저장됩니다.

관측점

관측 시점이 되는 포인트의 이름으로서, GPS 기지국이나 비GPS 기계점이 입력됩니다.

필드 필인(Fill-in) 기능을 이용하여 그래픽 창에서 어떤 포인트를 선택합니다.

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


개체 선택하기 - 와일드 카드 이용
개체 선택하기 − 와일드 카드 이용

 개요 및 추가 정보

[포인트 선택] 대화 상자로 포인트를 선택할 때나 [관측치 선택] 대화 상자로 관측치를 선택할 때, 와일드 카드 문자를 이용함으로써 어떤 범위의 값을 선택할 수 있습니다.

이용할 수 있는 와일드 카드 문자는 아래와 같습니다.

와일드 카드 문자를 여러 개 이용할 수도 있습니다. 예를 들어, 1?0*0에 부합하는 것은 1500이나 1A0250, 15020입니다.

다음은 유형별 패턴 매칭을 예시하는 표입니다.

포인트 이름 �10�은 �1�과 밶� 사이에 있는 것입니다. �1�과 �9� 사이의 범위에 들어가지 않는데, 이는 두 이름이 모두 수치이기 때문입니다.


    [관측치] 명령

[관측치 선택] 대화 상자를 불러오는 명령입니다.

이 명령은 [선택 / 관측치]를 선택함으로써 실행합니다


    [관측치 선택] 대화 상자

추가 정보

개요	방법 ...

이 대화 상자는 [선택 / 관측치] 명령을 실행하여 불러옵니다.

이 대화 상자에서 어떤 기준을 명시함으로써 관측치를 선택합니다. 와일드 카드와 범위를 이용할 수도 있고, 여러 탭에서 그 기준을 입력할 수도 있습니다. Trimble Geomatics Office는 이 모든 기준을 충족하는 관측치만 선택합니다.

[관측치 선택] 대화 상자의 탭:

  일반

  GPS

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


[관측치 선택] 대화 상자 - [일반] 탭
    [관측치 선택] 대화 상자 − [일반] 탭

이 탭을 이용하여 관측치 선택을 위한 일반 기준을 입력합니다.

시점 및 종점

이름은 콤마로 구분하여 여러 개를 입력할 수 있습니다. 생략 부호(...)나 대시(-)는 그 범위 내의 기선을 모두 선택합니다. 문자와 숫자를 조합한 이름이 포함된 범위 하에서는 뜻밖의 개체가 선택될 수 있는데, 이는 완전한 알파벳순의 정렬이 이용되기 때문입니다.

참조: 범위의 시작과 끝이 숫자인 경우(예: 1000�1005)에는 숫자 범위가 선택됩니다.

이 필드에서 와일드 카드를 이용할 수 있습니다.

사거리 범위

이 필드에 사거리 범위 기준을 입력합니다. 첫째 필드의 입력 값은 반드시 둘째 필드의 입력 값보다 작아야 합니다. 입력 값은 포함 개념입니다(즉, 입력 범위가 10 ~ 12라고 할 때, 10 이상/12이하이지 10 초과/12 미만이 아님).

수평 거리가 이 지정 범위 내에 있는 축소 변환 관측치가 있다면 그것도 선택됩니다.

종류

목록에서 관측치 종류를 선택합니다. 예를 들어, RTK나 레이저, 방위각 관측치를 선택할 수 있습니다.

출처 조건

목록으로부터 관측치 출처를 고르게 되는데, 여러 가지를 선택할 수 있습니다. 선택한 여러 출처의 어느 한가지에만 해당되면, 그 관측치는 모두 선택됩니다.

상태 조건

목록으로부터 관측치 상태 기준을 선택합니다.

관측치 ID 조건

특정 관측치 ID나 일련의 관측치 ID를 입력합니다. 예를 들어, GPS 기선 8을 선택하려면 B8을 입력합니다. B8−B12이라 입력하면 그 범위 안의 관측치가 모두 선택됩니다.

사이드샷만

이 확인란을 선택하면 사이드샷만 선택됩니다.

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


[관측치 선택] 대화 상자 - [GPS] 탭
    [관측치 선택] 대화 상자 − [GPS] 탭

GPS 기선 선택 기준을 입력합니다.

비율

미만(<) 부호나 초과(>) 부호를 선택합니다. 기준으로 설정할 비율 값을 입력합니다.

기준 분산

미만(<) 부호나 초과(>) 부호를 선택합니다. 기준으로 설정할 기준 분산을 입력합니다.

RMS

미만(<) 부호나 초과(>) 부호를 선택합니다. 기준으로 설정할 RMS 값을 입력합니다.

수평 정밀도

이하(<=) 단추나 이상(>=) 단추 중에서 설정하고자 하는 기준에 부합하는 부호를 선택합니다. 기준으로 설정할 수평 정밀도 값을 입력합니다.

수직 정밀도

이하(<=) 단추나 이상(>=) 단추 중에서 설정하고자 하는 기준에 부합하는 부호를 선택합니다. 기준으로 설정할 수직 정밀도 값을 입력합니다.

참조: 수평 정밀도 질의와 수직 정밀도 질의는 정확한 값을 그 토대로 합니다. 등록 정보 창의 필드에 표시되는 값은 반올림 처리된 숫자를 이용합니다.

해 유형

설정 기준으로 이용할 해 유형을 목록에서 선택하게 되는데 여러 가지를 선택할 수 있습니다.

측량 방식

기준으로 설정할 GPS 측량 방식을 목록에서 고르게 되는데, 여러 가지를 선택할 수 있습니다.

참조: 해 유형과 측량 방식을 공히 충족하는 관측치만 선택됩니다.

관측 시간

기준으로 할 날짜와 시간 범위를 이 필드에 입력합니다. 시작 시간과 정지 시간이 이 범위 안에 들어오는 관측치는 모두 선택됩니다. 입력하는 값은 다음에 이 옵션을 이용하는 경우에 대비하여 소프트웨어상에 저장됩니다.

다음의 관측 지속 시간(초) 이상

지정 시간 이상 관측이 지속된 GPS 기선을 선택합니다. 이 필드의 포맷은 hh:mm:ss입니다.

참조: 필드 필인 기능을 이용하여 시간을 지정할 수 있습니다.

현재 선택 부분에 추가

이 대화 상자를 불러올 때 이미 하나 이상의 개체가 선택되어 있는 경우, [현재 선택 부분에 추가] 확인란이 활성화됩니다. 이 대화 상자의 실행 결과로서 도출되는 새 선택 항목을 적용하기 전에 현재의 선택 부분을 해제해 버리고자 하면 이 확인란을 선택하지 않도록 합니다.


    [레이어 기준] 명령

특정 레이어에 있는 개체를 모두 선택하는 명령입니다.

명령 실행 방법:

  [선택 / 레이어 기준]을 선택합니다.

[레이어 기준 선택] 대화 상자가 나옵니다.


    [레이어 기준 선택] 대화 상자

특정 레이어에 있는 개체를 선택하는 대화 상자입니다.

이 대화 상자를 불러오려면

  [선택 / 레이어 기준] 명령을 실행합니다.

레이어

레이어 목록에는 프로젝트에 있는 레이어의 이름이 표시됩니다.

레이어에 나타나는 개체를 선택하려면 그 레이어 이름 옆의 확인란을 선택합니다.

레이어의 '보호' 속성이 활성으로 설정되거나, '표시' 속성이 해제로 설정되는 경우에는 그 레이어 옆에 있는 확인란의 색조가 어둡게 나타납니다. 이 레이어를 다시 선택할 수 있기 위해서는 레이어 선택 도구나 [레이어] 대화 상자를 이용하여 '보호' 속성과 '표시' 속성을 변경합니다. 그러면 레이어의 확인란이 다시 활성화됩니다.

모두 선택

레이어 목록에 나오는 레이어를 모두 선택하려면 이것을 누릅니다.

선택 안함

레이어 목록에 있는 레이어의 확인란을 모두 선택 해제하려면 이것을 누릅니다.


    [스타일 기준] 명령

특정 스타일을 이용하는 개체를 모두 선택하는 명령입니다.

이 명령은 [선택 / 스타일 기준]을 선택함으로써 실행합니다.

[스타일 기준 선택] 대화 상자가 나옵니다.


    [스타일 기준 선택] 대화 상자

'평면도 보기' 모드에서 이 대화 상자를 이용하여 특정 스타일의 CAD 개체(포인트, 선, 호, 곡선, 주석, 텍스트)를 모두 선택합니다.

이 대화 상자는 [선택 / 스타일 기준] 명령을 실행하여 불러옵니다.

스타일

기준으로 설정할 스타일 탭을 선택합니다. 이 스타일들은 [CAD 스타일] 대화 상자에서 나오는 스타일과 똑 같은 것입니다. 목록에서 스타일을 하나 선택합니다. 개체를 선택함에 있어 하나의 탭만 이용할 수 있는데, 어떤 탭 하에서 스타일을 선택한 다음, 다른 탭을 또 누르게 되면 이전 탭 하에서의 선택 내용이 없어져 버립니다.

따라서 개체를 두 종류 이상(예: 포인트와 선 등) 선택하려면, 일단 선택을 하고 나서 그 선택 집합을 저장한 다음, 다른 종류의 개체를 또 선택하면 됩니다. 이 두 번째 선택 집합도 저장합니다. [선택 / 선택 집합 / 검색] 명령을 실행하면 이 두 선택 집합을 동시에 검색해 올 수 있습니다.

<레이어 기준>으로 설정된 필드가 있는 개체를 선택하려면 <레이어 기준> 옵션을 이용합니다.

모두 선택

스타일 목록 상자에 나오는 스타일을 모두 선택하려면 이것을 누릅니다.

선택 안함

스타일 목록 상자에 있는 스타일의 확인란을 모두 선택 해제하려면 이것을 누릅니다.


    [종류 기준] 명령

특정 종류의 개체를 모두 선택하는 명령입니다.

이 명령은 [선택 / 종류 기준]을 선택함으로써 실행합니다.

[종류 기준 선택] 대화 상자가 나옵니다.


    [종류 기준 선택] 대화 상자

특정 종류의 개체를 선택하는 대화 상자입니다.

이 대화 상자는[선택 / 종류 기준]을 실행함으로써 불러옵니다.

종류

종류 목록에는 서로 다른 개체 종류(포인트, 선, 호, 곡선, 주석, 텍스트)의 이름이 모두 나타납니다.

어떤 종류의 개체를 선택하려면 그 종류 이름의 옆에 있는 확인란을 선택합니다.

모두 선택

종류 목록 상자에 나오는 종류를 모두 선택하려면 이것을 누릅니다.

선택 안함

종류 목록 상자에 있는 종류의 확인란을 모두 선택 해제하려면 이것을 누릅니다.


[질의 기준] 명령

특정 질의 조건에 부합하는 개체를 선택하는 명령입니다.

이 명령은 [선택 / 질의 기준]을 선택함으로써 실행합니다.

[질의 기준 선택] 대화 상자가 나옵니다.


[질의 기준 선택] 대화 상자

 개요 및 추가 정보

개체를 선택하기 위한 질의를 이 대화 상자에서 명시합니다.

이 대화 상자는 [선택 / 질의 기준]을 실행함으로써 불러옵니다.

질의

이용 할 수 있는 질의로는 다음과 같은 것이 있습니다. 또한 프로젝트에서 사용자가 정의한 사용자 정의 질의도 질의 목록에 모두 포함됩니다.

질의 이름	선택되는 항목
모든 이벤트	이벤트 레코드가 있는 관측치
단독 측위 GPS 점	단독 측위 위치가 있는 포인트. 예를 들어, .dat 파일의 처리되지 않은 포인트
수신기를 이용한 기선 �	같은 수신기로써 관측한 기선. [매개 변수 입력] 대화 상자에 해당 값을 입력합니다.
광파 관측된 포인트	광파 측량기로써 관측된 포인트
표고 범위	표고가 지정 범위 이내인 포인트. [매개 변수 입력] 대화 상자에 해당 값을 입력합니다.
키입력된 WGS-84	키입력된 WGS-84 점인 포인트
레이저 거리계 포인트	레이저 거리계로 관측한 포인트
비고	프로젝트의 비고 레코드 전부. 비고는 Trimble Survey Controller로써 현장에서 추가할 수 있습니다. 이 선택 옵션을 이용하여 사용자 정의 보고서를 만들기 위한 비고를 선택합니다.
공백값 좌표	좌표가 공백값인 포인트. 이는 좌표가 없는 후시점을 관측한 경우에 발생할 수있습니다.
공백값 표고	표고가 공백값인 포인트
설명 기준 포인트	지정한 것과 동일한 설명 필드가 있는 포인트. [매개 변수 입력] 대화 상자에 해당 값을 입력합니다. 와일드 카드 문자를 쓸 수 있습니다.
여러 번 관측된 포인트	두 번 이상 관측된 포인트. 이 질의는 모든 관측치 종류를 이용하는데, 비GPS 관측치에 대해서는 타겟 설정, RTK 선점에 대해서는 포인트의 GPS 선점, Static 및 Faststatic 선점에 대해서는 해당 포인트가 관측 종점인 경우의 선점을 각각 이용합니다.  이 때 그 합이 2개 이상이 되는 포인트는 모두 선택되게 됩니다.
이름이 다르고 특정 거리 이내에 있는 포인트	이름이 다르고 지정된 거리 이내에 있는 포인트. [매개 변수 입력] 대화 상자에 해당 값을 입력합니다.
이름이 없는 포인트	이름이 없는 포인트
공분산(QC2)이 있는 RTK 벡터	QC2 레코드가 있는 RTK 벡터. 이 포인트들은 망 조정에 이용할 수 있습니다. (Network Adjustment 모듈이 설치된 경우)
미처리 기선	처리할 수 있지만 아직 처리하지 않은 기선

질의는 그 정의 내용에 부합하는 개체를 선택하는 기능을 하는데, 해당 질의에 대한 설명문이 상태 표시줄에 표시됩니다.

예를 들어, 표고가 특정 범위 내에 있는 포인트들을 선택할 수 있습니다.

매개 변수가 필요한 질의의 경우에는 그 질의의 이름 끝에 생략 부호가 나옵니다. 따라서 이런 질의를 실행하고자 하면 그 매개 변수 값을 입력하여야 합니다.

선택 부분

[선택 부분] 상자에서 수행 가능한 선택 부분 작업 3가지:

  새 선택 부분 − 새 선택 집합을 만듭니다.

  현재 선택 부분에 추가 − 만들 선택 집합을 현재 선택 집합에 추가합니다.

  현재 선택 부분을 세밀화 − 만들 선택 집합에 공통되는 포인트를 현재 선택 집합을 이용하여 찾습니다.

예를 들어, 일련 번호가 1234인 GPS 수신기로써 관측한 미처리 기선을 모두 찾고자 하는 경우, 다음과 같이 처리합니다.

1.	모든 미처리 기선을 선택하는 질의를 이용합니다.

2.	질의를 다시 이용하여 [수신기를 이용한 기선 �] 옵션을 선택합니다.

3.	[선택 부분] 상자에서 [현재 선택 부분을 세밀화] 옵션을 선택합니다.

4.	[질의 기준 선택 − 매개 변수] 대화 상자에서 수신기 일련 번호 1234를 입력합니다.

수신기 1234로써 관측한 미처리 기선이 모두 선택됩니다.


[포인트 피쳐 기준] 명령

명시한 이름에 부합하는 속성이 있는 피쳐 코드의 포인트를 선택하는 명령입니다.

이 명령은 [선택 / 포인트 피쳐 기준]을 선택함으로써 실행합니다.

[포인트 피쳐 기준 선택] 대화 상자가 나옵니다.


[포인트 피쳐 기준 선택] 대화 상자

이 대화 상자를 이용하여 피쳐 및 속성 정보가 있는 포인트를 선택합니다. 어떤 포인트에 대하여 수집된 피쳐 및 속성을 보려면 등록 정보 창 � [속성] 탭을 이용합니다.

피쳐

피쳐 목록에는 속성을 이용하기 위하여 프로젝트를 구성할 때 쓴 피쳐 및 속성 라이브러리 (*.fcl) 파일이나 데이터 딕셔너리 (*.ddf) 파일의 피쳐 및 속성 정의가 전부 나옵니다.

원하는 피쳐의 확인란을 모두 선택합니다. 어떤 포인트의 피쳐가 여러 개 있을 때, 명시된 이 피쳐와 단 하나라도 일치하면 그 포인트는 선택됩니다.

모두 선택

모든 확인란을 선택하려면 이것을 누릅니다.

선택 안함

모든 확인란을 선택 해제하려면 이것을 누릅니다.


선택 집합 - 개요
선택 집합 − 개요

추가 정보

 방법...

개요

선택 집합이란 사용자가 현재 Trimble Geomatics Office에서 선택해 둔 어떤 것을 말합니다. 현행 선택 집합은 아무 때나 저장했다가 나중에 검색해 올 수 있습니다. 예를 들어, 프로젝트의 전체 기준점에 대한 선택 집합을 기록해 두었다가 주기적으로 검색해 올 수 있습니다. 저장된 선택 집합은 그 구성 개체의 순서를 유지하는데, 일부 구성 개체를 삭제하더라도 선택 집합은 계속 그 잔여 개체만으로 기능을 합니다.

참조: 선택 집합은 [보기 필터] 대화 상자에서 [선택 집합의 데이터만 표시] 옵션을 이용함으로써 표시할 수 있습니다.

Trimble Geomatics Office는 파일을 가져올 때 선택 집합에 자동으로 이름을 부여합니다. 선택 집합은 데이터의 수집 순서를 기록하는데, 이 순서는 피쳐 코드 처리 등의 작업에 있어 중요한 요소가 됩니다. Trimble Geomatics Office가 이 새 선택 집합에 이름을 부여함에 있어, Survey Controller (*.dc) 파일의 경우에는 가져오는 작업 식별자의 이름을, 그리고 ASCII 파일 등 기타 다른 파일의 경우에는 해당 파일의 이름을 각각 부여합니다.

참조: 초기화를 한 15분 이내에 초기화 유실이 발생한 RTK 데이터를 가져오는 경우, 높은 RMS 선택 집합이 가져오기시 만들어집니다.


선택 집합 - [저장] 명령
선택 집합 − [저장] 명령

현재의 선택 집합을 저장합니다.

실행 방법:

 [선택 / 선택 집합 / 저장]을 선택합니다.

[저장] 대화 상자가 나옵니다.

현재 선택된 것이 없을 경우에는 이 명령을 이용할 수 없습니다.


선택 집합 - [저장] 대화 상자
선택 집합 − [저장] 대화 상자

 개요 및 추가 정보

현재의 선택 집합을 저장합니다.

이 대화 상자는 [선택 / 선택 집합 / 저장]을 실행함으로써 불러옵니다.

이름

선택 집합의 이름을 입력합니다.

확인

이것을 누르면 그 선택 집합이 만들어집니다.

이제 이 선택 집합은 [검색] 대화 상자에 나오게 되고, 최근 이용한 선택 집합의 목록에도 추가됩니다. [검색] 대화 상자를 불러오거나, 최근 이용한 선택 집합의 목록을 보려면 [선택 / 선택 집합] 명령을 실행합니다.


선택 집합 - [검색] 명령
선택 집합 − [검색] 명령

선택 집합을 검색해 오는 명령으로서, 검색해 올 선택 집합이 없을 경우에는 이 명령을 이용할 수 없습니다.

실행 방법:

 [선택 / 선택 집합 / 검색]을 선택합니다.

선택 집합 � [검색] 대화 상자가 나옵니다.


선택 집합 - [검색] 대화 상자
선택 집합 − [검색] 대화 상자

 개요 및 추가 정보

이 대화 상자를 이용하여 한번에 하나 이상의 선택 집합을 검색해 옵니다. 예를 들어, 저장된 선택 집합이 2개 있을 경우, [검색] 대화 상자로써 이 두 선택 집합에 있는 개체를 전부 선택합니다.

이 대화 상자는 [선택 / 선택 집합 / 검색]을 실행함으로써 불러옵니다.

선택 집합

이 목록에는 프로젝트의 저장된 선택 집합이 모두 나옵니다.

모두 선택

모든 선택 집합을 선택하려면 이것을 누릅니다.

선택 안함

모든 선택 집합의 확인란을 선택 해제하려면 이것을 누릅니다.


선택 집합 - [편집] 명령
선택 집합 − [편집] 명령

저장된 선택 집합의 내역을 편집하는 명령으로서, 편집할 선택 집합이 없을 경우에는 이 명령을 이용할 수 없습니다.

이 명령은 [선택 / 선택 집합 / 편집]을 선택하여 실행합니다.

[편집] 대화 상자가 나옵니다.


선택 집합 - [편집] 대화 상자
선택 집합 − [편집] 대화 상자

 개요 및 추가 정보

저장된 선택 집합을 삭제하거나 그 이름을 변경합니다.

선택 집합

편집 또는 삭제하고자 하는 선택 집합을 선택합니다.

이름 변경

선택한 선택 집합의 이름을 변경하려면 이것을 누릅니다.

삭제

선택한 선택 집합을 삭제하려면 이것을 누릅니다.


선택 집합 - [이름 변경] 대화 상자
선택 집합 − [이름 변경] 대화 상자

 개요 및 추가 정보

선택한 선택 집합의 이름을 변경합니다.

이 대화 상자를 불러오려면,

1.	[선택 / 선택 집합 / 편집]을 실행합니다. [편집] 대화 상자가 나옵니다.

2.	[이름 변경]을 누릅니다.

이름

이 선택 집합의 새 이름을 입력합니다.

확인

이 단추를 눌러 변경 내용을 적용합니다.

이제 이 새 선택 집합이 [편집] 대화 상자와 최근 이용한 선택 집합의 목록에 나오게 됩니다.


개체 선택하기 - 개요
개체 선택하기 − 개요

어떤 작업을 프로젝트의 하위 집합에서만 수행하고자 하는 경우가 있습니다. 프로젝트의 개체(포인트, 선, 호, 곡선, 텍스트, 주석, 관측치)는 다음 2가지 방식으로 선택합니다.

  마우스를 이용

  [선택] 메뉴를 이용

마우스를 이용한 개체 선택

마우스로 클릭하여 개체를 선택합니다. (여러 개체를 선택하려면 Shift 키를 누른 채, 클릭)

선택이 끝나면, 필요한 작업을 수행합니다.

선택을 반전하려면 Ctrl키를 누릅니다. 현재 선택된 개체는 전부 선택이 해제되고, 그렇지 않은 개체는 선택이 됩니다.

참조: 등록 정보 창에서 여러 개체를 보고자 할 때, 이들을 하나씩 계속 선택할 필요 없이 일괄 처리할 수 있는 방법이 있습니다. 어떤 포인트상에서 마우스 단추를 몇 초간 누른 채 있은 다음, 보고자 하는 개체로 포인터를 끌면 됩니다.

[선택] 메뉴를 이용한 개체 선택

[선택] 메뉴에는 여러 가지의 포인트 선택법이 있습니다. 이 메뉴 하의 옵션은 측량 보기와 평면도 보기의 여하에 따라 달라집니다.


중복 포인트 - [좌표 기준] 명령
중복 포인트 − [좌표 기준] 명령

좌표가 동일한 포인트를 선택하는 명령입니다.

이 명령은 [선택 / 중복 포인트 / 좌표 기준]을 선택하여 실행합니다.


중복 포인트 - [이름 기준] 명령
중복 포인트 − [이름 기준] 명령

이름이 동일한 포인트를 선택하는 명령입니다.

실행 방법:

  [선택 / 중복 포인트 / 이름 기준]을 선택합니다.

팁: 중복 포인트를 병합하기 전에 이 명령을 이용합니다.


중복 포인트 - [이름 및 거리 기준] 명령
중복 포인트 − [이름 및 거리 기준] 명령

이름이 동일하고 지정 거리 이내에 있는 포인트를 선택하는 명령입니다. [매개 변수 입력] 대화 상자에 해당 값을 입력합니다.

실행 방법:

  [선택 / 중복 포인트 / 이름 및 거리 기준]을 선택합니다.


[측설점 선택] 대화 상자

일련의 질의를 이용하여 측설점을 선택하는 대화 상자입니다. 이 선택 도구는 기타 보고서 및 사용자 정의 내보내기 옵션과 함께 사용할 수 있습니다.

이 대화 상자는[선택 / 측설점] 명령을 실행하여 불러옵니다.

질의

질의 목록에는 다음의 것 뿐만 아니라 프로젝트에서 사용자가 따로 만든 사용자 정의 질의도 모두 포함됩니다.

질의 이름	선택되는 항목	[매개 변수 입력] 대화 상자에 아래 정보를 입력
모든 측설점	현장에서 측설한 모든 포인트
호 포인트	호에 참조된 포인트. 예를 들어, 호에서 시작해서 측설하거나 호까지 측설한 포인트	호 이름
DTM 점	DTM에 참조된 포인트. 예를 들어, DTM에서 시작해서 측설하거나 DTM까지 측설한 포인트	DTM 이름
선 포인트	선에 참조된 포인트. 예를 들어, 선에서 시작해서 측설하거나 선까지 측설한 포인트	선 이름
설계점	설계점에 참조된 포인트. 예를 들어, 설계점에서 시작해서 측설하거나 설계점까지 측설한 포인트	설계점 이름
도로점	도로점에 참조된 포인트. 예를 들어, 도로에서 시작해서 측설하거나 도로까지 측설한 포인트	도로 이름
도로의 캐치점	도로의 캐치점	도로 이름
피쳐가 있는 도로상의 포인트	피쳐가 있는 도로상의 포인트	도로 이름 및 피쳐
측설 오차가 다음 수치보다 큰 모든 포인트	측설 오차가 [매개 변수 입력] 대화 상자에 명시된 수평 오차와 수직 오차보다 큰 포인트
매개 변수가 필요한 질의는 그 이름 다음에 생략 부호가 뒤따릅니다. 이런 질의를 선택하는 경우에는 매개 변수 값을 입력하게 됩니다.

선택 부분

[선택 부분] 상자에서 수행 가능한 선택 부분 작업 3가지:

  새 선택 부분 − 새 선택 집합을 만듭니다.

  현재 선택 부분에 추가 − 만들 선택 집합을 현재 선택 집합에 추가합니다.

  현재 선택 부분을 세밀화 − 만들 선택 집합에 공통되는 포인트를 현재 선택 집합을 이용하여 찾습니다.

예를 들어, 일련 번호가 1234인 GPS 수신기로써 관측한 미처리 기선을 모두 찾고자 하는 경우, 다음과 같이 처리합니다.

1.	모든 미처리 기선을 선택하는 질의를 이용합니다.

2.	질의를 다시 이용하여 [수신기를 이용한 기선 �] 옵션을 선택합니다.  [선택 부분] 상자에서 [현재 선택 부분을 세밀화] 옵션을 선택합니다. [질의 기준 선택 − 매개 변수] 대화 상자에서 수신기 일련 번호 1234를 입력합니다

수신기 1234로써 관측한 미처리 기선이 모두 선택됩니다


캘리브레이션 점 선택

Trimble Geomatics Office 프로젝트에서 GPS 사이트 캘리브레이션 − 포인트 목록에 나오는 캘리브레이션 점을 선택하는 옵션입니다.

이것은 [선택 / 캘리브레이션 점]을 선택함으로써 실행합니다.

'GPS 사이트 캘리브레이션 − 포인트 목록'에 있는 캘리브레이션 점이 모두 선택됩니다.

참조: 이 옵션은 캘리브레이션 점 목록에 아무 포인트도 없다면 이용할 수 없습니다.


기술 지원

제품 사용 설명서 등으로써도 문제를 해결할 수 없을 경우에는 가까운 Trimble 딜러에 문의하시기 바랍니다. Trimble World Wide Web 사이트 (www.trimble.com/support/support.htm)를 이용하여 기술 지원을 요청할 수도 있습니다.


도구 모음 - 개요
도구 모음 − 개요

도구 모음에는 하나 또는 그 이상의 도구 단추가 들어 있습니다. Trimble Geomatics Office의 그래픽 메뉴 창에서 도구 모음과 도구 모음 사이는 굵은 수직선으로 구분됩니다. 도구 단추는 흔히 이용하는 메뉴 명령의 바로 가기입니다.

마우스 포인터를 어떤 도구 단추 위에 놓으면 그 도구에 대한 설명이 상태 표시줄에 나타납니다.

  도구팁

  상태 표시줄

Trimble Geomatics Office에 있는 기존 도구 모음의 배열 순서를 바꾸고자 하면, 해당 창에서  도구 모음과 도구 모음을 구분하는 굵은 수직선을 이용하여 드래그 합니다.

다음의 도구 모음은 '측량 보기' 및 '평면도 보기' 중 어느 보기에서도 이용할 수 있습니다.

  표준

  보기 화면

  보기 제어

다음의 도구 모음은 '측량 보기'에서만 이용할 수 있습니다.

  필터

  Timeline (기선처리 모듈이 설치되어 있는 경우)

  Timeline 플롯 (기선처리 모듈이 설치되어 있는 경우)

  타원 제어 (망 조정 모듈이 설치되어 있는 경우)

다음의 도구 모음은 '평면도 보기'에서만 이용할 수 있습니다.

  레이어

  CAD


CAD 도구 모음

 이 도구 모음은 [삽입] 메뉴의 일반 기능을 쉽게 이용할 수 있도록 해 줍니다.

도구	불러오는 대화 상자	데이터베이스에 추가하는 항목
	포인트 삽입	포인트 레코드
	방위각 및 거리로 포인트 삽입	포인트 레코드
	선 작업 삽입	선 레코드
	선 작업 삽입	곡선 레코드
	선 작업 삽입	호 레코드
	텍스트 삽입	텍스트 레코드


표준 도구 모음

 표준 도구 모음은 [파일] 메뉴 및 [편집] 메뉴에서 이용 가능한 몇몇 주요 옵션을 손쉽게 이용할 수 있도록 해 줍니다.

도구	기능
	새 프로젝트를 만듭니다.
	기존 프로젝트를 불러옵니다.
	파일이나 장치, GPS 수신기로부터 데이터를 가져옵니다.
	데이터를 파일이나 장치, GPS 수신기로 내보냅니다.
	선택된 부분을 잘라내어 클립보드에 저장합니다.
	선택된 부분을 복사하여 클립보드에 저장합니다.
	클립보드의 내용을 삽입합니다.
	직전의 실행 명령을 취소합니다.
	직전의 실행취소 명령을 다시 수행합니다.
	등록 정보 창을 불러와 현재 선택 부분의 등록 정보를 보거나 편집합니다.


 [레이어 편집] 도구

 를 선택하면 [레이어 편집] 대화상자가 나옵니다. 이 대화상자는 레이어의 관리에 이용합니다.


    [레이어 선택] 도구

표시된 레이어가 현재 레이어입니다. 현재 레이어를 바꾸려면, 화살표를 클릭하고 드롭다운 목록으로부터 해당 레이어를 선택합니다.

전구 아이콘의 모양을 보면 그 레이어가 표시(Visible) 상태인지 아닌지 알 수 있습니다. 레이어의 표시 상태를 바꾸려면 해당 레이어의 전구를 클릭합니다.

전구 아이콘이 흐려집니다. 레이어가 보이게 하려면 전구 아이콘을 다시 클릭합니다. '표시' 속성이 선택 해제되어 있는 레이어가 하나라도 있으면 전구 아이콘이 상태 표시줄에 나타납니다.

자물쇠 아이콘의 모양을 보면 그 레이어가 보호(Locked) 상태인지 아닌지 알 수 있습니다. '보호' 속성이 선택되어 있는 상태에서는 해당 레이어의 개체가 그래픽 창에 보일지라도 이를 선택할 수 없습니다.

레이어의 보호 상태를 바꾸려면 해당 레이어의 자물쇠 아이콘을 클릭합니다. 레이어를 선택할 수 있도록 하려면, 자물쇠 아이콘을 다시 클릭합니다. '보호' 속성이 선택되어 있는 레이어가 하나라도 있으면 자물쇠 아이콘이 상태 표시줄에 나타납니다.

참조: 이러한 속성은 [레이어] 대화상자를 이용해서도 바꿀 수 있습니다.


보기 제어 도구 모음

 이 도구 모음은 주요 그래픽 창에서 화면을 여러 형태로 볼 수 있도록 해주는 도구 입니다.

다음의 단추들은 지속 모드로 작동됩니다. 지속 모드(sticky mode)란 다른 도구를 선택할 때까지는 기존의 선택된 도구의 효력이 지속된다는 의미입니다.

도구	기능
	선택 모드로 변합니다.
	축소/확대 영역의 중심이 이동됩니다.
	2배로 확대됩니다.
	2배로 축소됩니다.

다음의 도구들은 변동 모드(not sticky mode)로 작동됩니다. 이용할 때마다 선택을 해야 한다는 의미입니다.

도구	기능
	전체 내용을 볼 수 있게 배율이 조정됩니다.
	직전의 배율설정으로 되돌아 갑니다.
	프로젝트 표시줄을 숨기거나 표시합니다.
	그래픽 창에 그리드 선을 숨기거나 표시합니다. ([보기 옵션] 대화상자에서도 동일한 기능을 이용할 수 있습니다.)


보기 화면 도구 모음

이 도구 모음을 이용하여 다음과  같은 작업을 합니다.

도구	기능
	측량 화면으로 전환합니다.
	평면도 화면으로 전환합니다.


    필터 도구 모음

이 도구 모음은 '측량 보기'에서만 이용할 수 있습니다. 여기에는 [보기 필터] 및 [Timeline] 도구가 들어 있습니다.

도구	기능
	'측량 보기'에서 어떤 관측치가 어떻게  보이게 할 것인지를 결정합니다.
	Timeline 창을 엽니다.
	그래픽 창과 Timeline에서 관측치를 링크합니다. (이 도구를 선택할 때 소프트웨어가 표시하는 것은 1)현재의 Timeline 화면 내에 있는 후처리 기선, 2)이와 동시에 관측된 후처리 기선뿐입니다. 기타 다른 후처리 기선은 '측량 보기'에서 숨겨집니다.)  이것은 독립 기선을 선택할 때 유용한 도구입니다.


    레이어 도구 모음

 레이어 도구 모음은 '평면도 보기'에서만 이용할 수 있습니다. 여기에는 [레이어 편집] 도구와 [레이어 선택] 도구가 있습니다. 이 도구 모음은 레이어의 관리에 이용합니다.


    [피쳐 코드 처리] 명령

이 명령은 피쳐 코드를 처리할 때 사용합니다.

이 기능을 이용하려면 [도구/ 피쳐 코드 처리]를 선택합니다.

[피쳐 코드 처리] 대화 상자가 나타납니다.


    [피쳐 코드 처리] 대화 상자

 개요

이 대화 상자는 피쳐 코드를 처리할 때 사용합니다.

이 기능을 이용하려면 도구/ 피쳐 코드 처리를 선택합니다.

피쳐 및 속성 라이브러리

데이터 처리를 위해 사용하고자 하는 피쳐 및 속성 라이브러리를 선택합니다.

찾아보기

피쳐 및 속성 라이브러리를 찾고자 할 때 이 단추를 클릭합니다.

참조: Trimble Geomatics Office에서 모든 피쳐 및 속성 라이브러리의 파일 형태는 (*.fcl)입니다. 사용자가TRIMMAP system 또는 SDRmap system으로부터 피쳐 및 속성 라이브러리를 선택하면 Trimble Geomatics Office가 그 피쳐 및 속성 라이브러리를 (*.fcl) 파일 형식으로 자동 변환시킵니다.

예를 들어, 'Fclib??.dat' 파일(TRIMMAP 시스템 또는 SDRmap 시스템 피쳐 코드 라이브러리의 파일 이름 패턴)을 선택했을 경우에, 이 라이브러리를 처리할 시Trimble Geomatics Office가 이 라이브러리를 변환시킬지 여부를 묻습니다. 시스템은 또한 라이브러리 저장 시 사용할 이름을 물어 옵니다. 기본값으로 제시되는 이름은Fclib??.fcl 패턴이며 이는 시스템 폴더에 기본값으로 저장됩니다.

만약Trimble Geomatics Office가 변환시킬 수 없는 코드 정의를 발견할 경우에는 해당 라이브러리를 편집해야 한다는 경고 메시지를 줍니다. 오류가 발생 시에는 시스템이 보고서를 작성합니다.

처리

피쳐 코드는 선택된 순서대로 처리됩니다.

현재 선택된 개체들을 처리하고자 할 경우에는 '현재 선택 부분' 옵션을 선택합니다.

'선택 집합' 옵션을 선택한 후 처리해야 할 목록으로부터 선택 집합을 선택합니다.

선택 집합이 없으면 '현재 선택 부분' 옵션은 사용할 수 없습니다.

확인

이 단추를 눌러 피쳐 코드를 처리합니다.

라이브러리가 처리되고 피쳐 코드 처리 결과가 그래픽 창에 나타납니다. 처리 중 오류가 발생하면 오류 발생 보고서를 볼 수 있습니다. 어디에서 오류가 발생했는지 알고자 할 경우에는 보고서를 봅니다. 보고서는 프로젝트의 보고서 폴더에 보관되므로 나중에 다시 볼 수 있습니다.


Trimble RoadLink - 개요
Trimble RoadLink − 개요

Trimble RoadLink�는Trimble Geomatics Office 유틸리티입니다. 이것은 제 3 자 도로 정의와 Trimble 측량 장치 사이의 강력한 인터페이스 입니다.

다음과 같은 목적으로 사용합니다.

  데이터 입력

  그래픽상에서 데이터  보기

  데이터 편집

그리고 나서 측설 도중 사용할 수 있도록 도로 정의를Trimble 측량 장치로 전송합니다.

RoadLink는 도로 정의를 전송하기 위한 2 가지의 방법을 제공합니다.

  제 3 자 디자인 소프트웨어가 제공하는 파일(평면 선형, 종단 선형, 횡단면)은 자동 변환

 평면 선형, 종단 선형, 템플리트, 편경사 등을 포함한 도로 정의의 수동 입력

Trimble Geomatics Office에서 없어서는 안될 구성 요소인 RoadLink는 또한 Trimble의DTMLink 유틸리티에서 정의한 지형면 모델과 도로 정의 사이의 절토/성토 토공량을 계산합니다.


Trimble DTMLink - 개요
Trimble DTMLink − 개요

Trimble DTMLink�는 Trimble Geomatics Office의 유틸리티입니다. 이 유틸리티는 수치 지형면 (terrain surfaces)을 만듭니다. 이 소프트웨어를 이용하면 제3자 소프트웨어로 정의된 지형면을 가져오고, 새 지형면을 만들고 기존 지형면을 편집할 수 있습니다. 아울러 이러한 지형면을 Trimble Survey Controller로 전송하여 현장 측설에 이용할 수도 있습니다.

이 소프트웨어는 등고 지형면 모델 (contour surface model)에 경계선 및 분할선을 포함시킬 수 있으며, 모델 형성을 더욱 폭 넓게 제어할 수 있도록 고급 삼각 편집 기 (advanced triangle editing features)을 허용합니다.

그리드나 삼각 DTM이 등고 지형면 모델로부터 만들어져 장치나 데이터 파일로 내보내집니다.

Trimble RoadLink는 토공량 계산을 하는 데 사용자가 만든 모델을 사용할 수도 있습니다.

Trimble DTMLink로 체적 보고서를 작성할 수 있습니다.

주로 응용되는 체적 계산은 다음과 같습니다.

  자재 비축량 용적

  석탄층과 같은 지층의 용적

  건설할 댐 뒤쪽 호수의 공체적

DTMLink는 삼각 프리즘 각각의 부피를 계산하는 방법을 이용합니다. 이 부피는 프리즘의 밑면적과 평균 높이를 이용하여 등고 지형면 모델을 형성하는 삼각면에 의하여 정의됩니다.

DTMLink를 이용하여 비교 지형면을 만들 수 있습니다. 비교 지형면이란 두 지형면 간 차이의 등고 모델입니다. 이 지형면을 '표고의 위' 용적 계산 방법과 함께 사용하면 두 지형면 사이의 절토 및 성토 토공량을 계산할 수 있습니다.


    [시작] 명령

이 명령으로Trimble의  DTMLink 유틸리티를 시작합니다.

이 기능을 이용하려면,

  [도구 / DTMLink / 시작]을 선택합니다.

새 지형면을 만들거나 기존의 지형면을 열지 않고 이 명령으로써 DTMLink을 실행하여 3차원 면 AutoCAD DXF 파일을 가져옵니다.

그렇게 하려면,

1.	[도구 / DTMLink / 시작]을 선택합니다.

2.	[파일 / 가져오기]를 선택합니다.

좀 더 자세한 정보는 DTMLink 도움말을 참조합니다.


    [새 지형면] 명령

이 명령은 새 지형면 모델을 만들고자 할 경우에 사용합니다.

이 기능을 이용하려면 [도구 / DTMLink / 새 지형면]을 선택합니다.

[새 지형면] 대화 상자가 나타납니다.


    [새 지형면] 대화 상자

이 대화 상자는 새 지형면 모델을 만들고자 할 경우에 사용합니다.

이 기능을 이용하려면 [도구 / DTMLink / 새 지형면]을 선택합니다.

이름

새 지형면에 대한 적당한 이름을 입력합니다.

포인트

포인트 옵션에서는 프로젝트 데이터베이스의 어떤 포인트를 지형면 형성에 사용할 것인지를 선택합니다.

  현재의 데이터베이스 선택 부분이 없을 경우에는 '현재 선택 부분' 옵션은 사용할 수 없습니다.

  현재의 선택 부분이 있을 경우 '현재 선택 부분' 옵션을 선택하면 지형면 형성을 위해 현재 선택된 부분의 포인트를 사용합니다.

'전체 데이터베이스' 옵션은 모든 데이터베이스 포인트를 사용하여 지형면을 형성합니다.

'선택 집합' 옵션에서는 기존의 선택 집합을 선택할 수 있으며, 이 선택 집합 속에는 지형면을 형성하기 위해 사용하고자 하는 포인트들이 있습니다.

분할선 이용

'분할선 이용' 옵션들을 사용하면 지형면 형성 시에 분할선으로 사용할 선작업을 데이터베이스로부터 선택할 수 있습니다.

지형면 모델 형성에서 분할선이란 일정한 경사도를 지닌 것으로 인정되는 선으로 모델 형성을 제어하는 데 도움이 되는 선입니다.

이러한 옵션들은 '분할선 이용' 옵션을 선택했을 때만 사용이 가능합니다. 어떤 분할선 정보를 지형면 형성 작업에 전달하기 위해서는 반드시  '분할선 이용'을 선택 하여야 합니다.

'선택 집합' 옵션을 사용하면 기존의 선택 집합에 있는 선 작업을 골라 지형면을 형성하는 동안 분할선으로 사용할 수 있습니다. '레이어' 옵션을 사용하면 기존의 레이어에 있는 선 작업을 골라 지형면을 형성하는 동안 분할선으로 사용할 수 있습니다. 두 경우 모두, 사용 가능한 선택 집합이나 레이어 목록이 나타납니다.

제외 경계선 이용

'제외 경계선 이용' 에 있는 옵션들은 위에서 설명한 '분할선 이용' 옵션들과 동일한 방법으로 사용됩니다. 이 옵션들을 사용하면 '선택 집합' 또는 '레이어' 에 있는 기존의 선 작업을 지정하여  지형면 모델을 형성하는 동안 1 개 또는 그 이상의 제외 경계선을 정의할 수 있습니다.

제외 경계선이란 그 내부에 지형면 삼각형이 형성되지 않는 일련의 폐쇄 형태의 선들입니다. 제외 경계선 정의에 지정된 선 작업이 완전 폐쇄 형태를 형성하지 않으면 지형면 모델 형성 기능에 기본값으로 가지고 있는 폐쇄 선들을 추가합니다.

포함 경계선 이용

'포함 경계선 이용' 에 있는 옵션들은 위에서 설명한 '제외 경계선 이용' 옵션들과 동일한 방법으로 사용됩니다. 이 옵션을 이용하면 '선택 집합' 또는 '레이어' 에 있는 기존의 선 작업을 선택하여 이를 지형면 모델을 형성하는 동안 1 개 또는 그 이상의 포함 경계선의 정의로 사용할 수 있습니다.

포함 경계선이란 그 내부에 지형면 삼각형이 형성되는 일련의 폐쇄 형태의 선들입니다. 정의된 포함 경계선 외부에는 어떤 삼각형도 형성되지 않습니다. 포함 경계선 정의에 지정된 선 작업이 완전 폐쇄 형태를 형성하지 않으면 지형면 모델 형성 기능에 기본값으로 가지고 있는 폐쇄 선들을 추가합니다.

참조: 분할선, 제외 경계선, 포함 경계선 등에 사용되는 선 작업은 호와 곡선들을 포함할 수 있습니다. 이럴 경우DTMLink는 호 또는 곡선을 트라이앵글 형성에 사용할 수 있는 일련의 짧고 곧은 선분들로 해석합니다. DTMLink는 어떤 선분도 호 또는 곡선으로부터 2 cm 이상 벗어나지 않도록 합니다.

경계선과 분할선에 대한 좀 더 자세한 정보는Trimble DTMLink 온라인 도움말을 참조하십시오.


    [기존 지형면] 명령

이 명령은 기존의 지형면 모델을 편집하는 데 사용합니다.

이 기능을 이용하려면, [도구 / DTMLink / 기존 지형면]을 선택합니다.

[기존 지형면] 대화 상자가 나타납니다.


    [기존 지형면] 대화 상자

이 대화 상자는 기존의 지형면 모델을 편집하는 데 사용합니다. 이 대화 상자에서는 기존 지형면에 추가하고자 하는 포인트와 선 작업을 프로젝트 내에 지정할 수 있습니다.

이 기능을 이용하려면, [도구 / DTMLink / 기존 지형면]을 선택합니다

참조: 만약 이 대화 상자에서 기존 지형면에 이미 있는 포인트와 선 작업을 지정하면 시스템이 이를 인지하여 이들을 지형면에 재차 추가하지 않습니다.

이름

이 필드는 프로젝트에 있는 기존 지형면의 목록을 표시합니다. 설치한 후 편집하고자 하는 지형면을 선택합니다.

포인트 추가

기존 지형면에 추가될 포인트를 프로젝트 데이터베이스에서 선택합니다.

현재의 데이터베이스로부터 선택 부분이 없을 경우에는 '현재 선택 부분' 옵션은 사용할 수 없습니다.

선택 부분이 있으면 '현재 선택 부분' 옵션은 현재 선택 부분에 있는 포인트를 기존 지형면에 추가합니다.

'전체 데이터베이스' 옵션은 데이터베이스에서 현재 사용되는 모든 포인트를 지형면 모델로 보냅니다. 따라서 데이터베이스에 있는 어떤 새로운 포인트도 자동으로 모델에 추가 됩니다.

'선택 집합' 옵션에서는 기존 지형면에 추하고자 하는 포인트를 가지고 있는 기존의 선택 집합을 고를 수 있습니다.

분할선 추가

'분할선 추가'  옵션들을 사용하면 기존의 지형면에 있는 분할선들에 추가할 선작업을 데이터베이스로부터 선택할 수 있습니다. 이 옵션들은 '분할선 추가' 옵션을 선택하였을 때만 사용이 가능합니다.

어느 분할선 정보를 기존 지형면에 추가하려면 '분할선 추가' 옵션을 먼저 선택해야만 합니다. 지형면 모델 형성에서 분할선이란 일정한 경사도를 지닌 것으로 인정되는 선으로 모델 형성을 제어 하는 데 도움이 되는 선입니다.

'선택 집합' 옵션을 사용하면 기존의 선택 집합에 있는 선 작업을 골라 기존의 지형면에 분할선으로 추가할 수 있습니다.

'레이어' 옵션을 사용하면 기존의 레이어에 있는 선작업을 골라 기존의 지형면에 분할선으로 추가할 수 있습니다.

두 경우 모두, 사용 가능한 선택 집합이나 레이어 목록이 나타납니다.

제외 경계선 추가

'제외 경계선 추가' 에 있는 옵션들은 위에서 설명한 '분할선 추가' 옵션들과 동일한 방법으로 사용됩니다.

이 옵션을 이용하면 '선택 집합'이나 '레이어' 에 있는 기존의 선 작업을 선택하여 이를 기존 지형면의 제외 경계선 정의에 제외 경계선으로서 추가할 수 있습니다.

제외 경계선이란 그 내부에 지형면 삼각형이 형성되지 않는 일련의 폐쇄 형태의 선들입니다.

제외 경계선 정의에 지정된 선 작업이 완전 폐쇄 형태를 형성하지 않으면 지형면 모델 형성에 기본값으로 가지고 있는 폐쇄 선들을 추가합니다.

포함 경계선 추가

'포함 경계선 추가' 에 있는 옵션들은 위에서 설명한 '제외 경계선 추가' 옵션들과 동일한 방법으로 사용됩니다.

이 옵션을 이용하면 '선택 집합'이나 '레이어' 에 있는 기존의 선 작업을 선택하여 이를 기존 지형면의 포함 경계선 정의에 포함 경계선으로서 추가할 수 있습니다.

포함 경계선이란 그 내부에 지형면 삼각형이 형성되는 일련의 폐쇄 형태의 선들입니다. 정의된 포함 경계선 외부에는 어떤 삼각형도 형성되지 않습니다.

포함 경계선 정의에 지정된 선 작업이 완전 폐쇄 형태를 형성하지 않으면 지형면 모델 형성에 기본값으로 가지고 있는 폐쇄 선들을 추가합니다.

참조: 분할선, 제외 경계선, 포함 경계선 등에 사용되는 선 작업은 호와 곡선들을 포함할 수 있습니다. 이 경우에DTMLink는 호 또는 곡선을 트라이앵글 형성에 사용할 수 있는 일련의 짧고 곧은 선분들로 해석합니다. DTMLink는 어떤 선분도 호 또는 곡선으로부터 2 cm 이상 벗어나지 않도록 합니다.

경계선과 분할선에 대한 좀 더 자세한 정보를 원하면 DTMLink 온라인 도움말을 참조하시기 바랍니다.


    [시작] 명령

이 명령으로Trimble의 RoadLink 유틸리티를 작동시킵니다. 이 소프트웨어를 사용하면 Trimble 측량 장치로 전송하기 위한 측설용 도로 정의를 외부에서 가져오거나 수동으로 입력할 수 있습니다.

이 기능을 이용하려면,

  [도구 / RoadLink / 시작]을 선택합니다


    [내보내기] 명령

이 명령은 선택 집합, 전체 데이터베이스, 또는 현재 선택 부분으로부터 포인트들을 RoadLink로 내보낼 때 사용합니다.

이 기능을 이용하려면,

 [도구 / RoadLink / 내보내기]를 선택합니다

[RoadLink 내보내기] 대화 상자가 나타납니다.


    [내보내기] 대화 상자

이 대화 상자는 선택 집합, 전체 데이터베이스, 또는 현재 선택 부분으로부터 포인트들을 Trimble RoadLink로 내보낼 때 사용합니다. RoadLink에 있는 기존 데이터베이스 포인트를 출력하면 도로 정의를 입력하거나 확인하는 데 도움이 될 수 있습니다.

이 기능을 이용하려면,

  [도구 / RoadLink / 내보내기]를 선택합니다

포인트

포인트 집합을 선택합니다.

3 가지 옵션이 가능합니다.

현재 선택 부분	선택된 포인트들을 내보냅니다.
전체 데이터베이스	모든 데이터베이스 포인트들을 내보냅니다.
선택 집합	목록으로부터 선택 집합을 선택합니다.

좀 더 자세한 정보는RoadLink도움말을 참조하시기 바랍니다.


상표

구 및 삼각형 로고와 Trimble, DTMLink, GPSurvey, RoadLink, Trimble Geomatics Office, Trimble Survey Controller, Trimble Survey Office, Trimble Total Control, TRIMMAP, TRIMNET, TSC1, TSCe 는 Trimble Navigation Limited의 상표입니다.

Trimble, Geodimeter, GPS Pathfinder와 육분의 로고는 US Patent and Trademark Office에 등록된 Trimble Navigation Limited의 상표입니다.

기타 다른 상표는 해당되는 각 소유자의 자산입니다.

Standard Template Library, � 1994 Hewlett-Packard Company, Standard Template Library, � 1996,97 Silicon Graphics Computer Systems, Inc., Standard Template Library, � 1997 Moscow Center for SPARC Technology.


[프로젝트 압축 및 복구] 명령

이 명령을 사용하여 프로젝트의 데이터베이스를 압축하고 복구합니다.

이 기능을 이용하려면,

  [유틸리티 / 프로젝트 압축 및 복구]를 선택합니다.

[프로젝트 압축 및 복구] 대화 상자가 열립니다.


[프로젝트 압축 및 복구] 대화 상자

이 대화 상자를 이용하여 프로젝트의 데이터베이스를 압축하고 복구합니다.

압축

압축을 하면 하드 디스크의 공간이 절약되고 소프트웨어의 성능 향상에도 도움이 됩니다.   정기적으로 프로젝트 데이터베이스를 압축하는 습관을 들이면 좋습니다.

복구

Trimble Geomatics Office를 실행하는 중, 정전 등으로 인해 데이터베이스가 손상을 입을 수 있습니다.

데이터베이스의 편집 도중 예기치 않게 Trimble Geomatics Office가 종료되면, 데이터베이스를 복구하더라도 마지막으로 변경된 데이터는 잃을 수도 있습니다. 그럴 때에는 그 프로젝트를 다시 열고, 마지막에 편집하던 부분으로 되돌아 가서 변경된 데이터가 저장이 되었는지 확인해야 합니다.

이 대화 상자를 불러오려면,

1.	[유틸리티 / 프로젝트 압축 및 복구] 명령을 실행합니다.

2.	압축 및 복구할 프로젝트를 선택합니다.

프로젝트의 데이터베이스를 압축 또는 복구할 수 없을 때에는 오류 메시지가 나타납니다.

팁: 하드 디스크가 심하게 조각이 나 있으면, 조각 모음을 먼저 실행하고 나서 데이터베이스를 압축합니다.


Trimble Geomatics Office 유틸리티

Trimble Geomatics Office를 설치 할 때 표준 설치 옵션을 선택하면 다음과 같은 Trimble Geomatics Office 유틸리티를 이용할 수 있습니다.

Trimble Coordinate System Manager� 유틸리티

Trimble Convert to RINEX� 유틸리티

Trimble Data Transfer 유틸리티

Trimble DC File Editor� 유틸리티

Trimble Feature and Attribute Editor� 유틸리티

Trimble Line Type Editor� 유틸리티

Planning 유틸리티

Trimble Symbol Editor� 유틸리티

Trimble A1 Viewer 유틸리티

참조: Trimble Grod Factory� 유틸리티를 사용하려면 사용자 정의 옵션으로 설치하시기 바랍니다.

자세한 사항은 Trimble Geomatics Office 사용 설명서를 참조하십시오.

유틸리티 추가

[유틸리티] 메뉴에 별도의 유틸리티를 추가하려면,

1.	Microsoft Windows 탐색기를 사용하여 Program Files\Trimble\Trimble Geomatics Office\Utility 폴더로 찾아 갑니다

2.	탐색기 창 오른쪽의 빈 곳에서 마우스의 오른 쪽 단추를 누릅니다

3.	[새로 만들기 / 바로가기] 옵션을 선택합니다.

[바로가기 작성] 마법사가 열립니다

4.	[유틸리티] 메뉴에 추가하고자 하는 유틸리티의 경로를 입력합니다.

5.	[다음]을 누르고 '바로가기의 이름을 지정해 주십시오' 필드에 [유틸리티] 메뉴에 추가하고자 하는 유틸리티의 이름을 기입합니다.

차후 Trimble Geomatics Office를 실행할 때, 추가한 바로가기에 해당하는 유틸리티가 [유틸리티] 메뉴에 나타납니다.


Symbol Editor

Trimble Symbol Editor™ 유틸리티로 Trimble Geomatics Office에서 쓰는 포인트 심벌 라이브러리 (*.sym)를 편집할 수 있습니다.

이 기능을 이용하려면, 다음 중 하나를 실행합니다:

  열려 있는 프로젝트가 없을 때는 [유틸리티 / Symbol Editor]를 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

이 유틸리티는 포인트 심벌을 새로 만들거나 기존의 심벌을 수정할 때 사용합니다. 편집한 파일을 일단 시스템 파일로서 등록하면, Trimble Geomatics Office나 Trimble Feature and Attribute Editor 유틸리티로 포인트 스타일을 추가하거나 수정할 때 새로 만든 이 심벌을 이용할 수 있게 됩니다.

포인트 스타일은,

  Trimble Geomatics Office에서 포인트의 표시 형식을 설명하는 정의입니다.

  Symbol Editor 유틸리티에서 만든 심벌이 들어 있습니다.

Symbol Editor로 어떤 심벌을 새로 만들었다고 해서, 그 심벌이 자동적으로 Trimble Geomatics Office에서 사용 가능한 포인트 스타일이 되는 것은 아닙니다.  포인트에 할당되는 것은 포인트 스타일이지 심벌이 아니므로 새로 만든 그 심벌을 사용해서 포인트 스타일을 정의해야 합니다.

Symbol Editor는Trimble Geomatics Office가 사용 중인 현재의 심벌 라이브러리와 함께 자동으로 열립니다.  열린 라이브러리에 있는 심벌 이름들이 화면의 목록에 나타납니다. 이 목록에서 편집할 심벌을 선택합니다.

Symbol Editor를 Trimble Geomatics Office와 상관없이 단독으로 실행할 수도 있습니다. Trimble Geomatics Office 폴더에서 Symbol Editor 유틸리티의 바로가기 아이콘을 선택하면 됩니다.

참조: Trimble Geomatics Office와 상관없이 단독으로 실행할 경우에는  현재의 심벌 형식을 변경하더라도 그 변경 사항이 현재 열려 있는 프로젝트에 반영되지 않습니다.  그 변경 사항이 적용되게 하려면, 프로젝트를 닫았다가 다시 열면 됩니다. 저장된 변경 사항을 심벌 라이브러리에서 사용할 수 있게 됩니다.

자세한 내용은 Trimble Symbol Editor 유틸리티의 도움말을 참조하십시오.


Line Type Editor

Trimble Line Type Editor ™ 유틸리티로 Trimble Geomatics Office에서 쓰이는 선 형식 라이브러리 (*.ltp)를 편집합니다.

이 기능을 이용하려면, 다음 중 하나를 실행합니다:

 열려 있는 프로젝트가 없을 때는 [유틸리티 / Line Type Editor]를 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

이 유틸리티는 선 형식을 새로 만들거나 기존의 선 형식을 변경할 때 사용합니다. 편집한 파일이 일단 시스템 파일로서 등록되면,  새로 만든 선 형식은 Trimble Geomatics Office나 Trimble Feature and Attribute Editor 유틸리티로 선 스타일을 추가하거나 변경할 때 이용할 수 있게 됩니다.

선 스타일은,

  Trimble Geomatics Office에서 선의 표시 형식을 설명하는 정의입니다.

  Line Type Editor 유틸리티에서 만든 선 형식이 들어 있습니다.

Line Type Editor 유틸리티로 새로운 선 형식을 만들었다고 해서,  그 선 형식이 자동적으로 Trimble Geomatics Office에서 이용할 수 있는 선 형식이 되는 것은 아닙니다.  선에는 선 스타일이 할당되고, 이 선 스타일은 새로 만든 선 형식을 사용하여 정의되어야 합니다.

Line Type Editor 유틸리티는 Trimble Geomatics Office가 사용 중인 현재의 심벌 라이브러리와 함께 자동으로 열립니다.  이 열린 라이브러리에 있는 선 스타일의 이름이  화면의 목록에 나타납니다. 선 형식을 편집할 때 이 목록을 사용합니다.

Line Type Editor를 Trimble Geomatics Office와 상관없이 단독으로 실행할 수도 있습니다. Trimble Geomatics Office 폴더에서 Line Type Editor 유틸리티의 바로가기 아이콘을 선택하면 됩니다.

참조: Trimble Geomatics Office와 상관없이 단독으로 실행할 경우에는 시스템 선 형식 라이브러리가 변경되더라도, 그 변경사항이 현재 프로젝트에 반영되지 않습니다.  그 변경 사항이 적용되게 하려면, 선 형식 라이브러리에 변경 사항을 저장한 후 프로젝트를 닫았다가 다시 열면 됩니다. 그러면 저장된 변경 사항을 선 형식 라이브러리에서 사용할 수 있게 됩니다.

상세한 내용은 Trimble Line Type Editor 유틸리티의 도움말을 참조하십시오.


Grid Factory

Trimble Grid Factory™ 유틸리티를 설치하려면, 사용자 정의 설치 옵션을 사용해야 합니다.

일단 설치 한 후  Grid Factory를 사용하려면, 다음 중 하나를 실행합니다:

  열려 있는 프로젝트가 없을 때는 [유틸리티 / Grid Factory]를 엽니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

데이텀 그리드 (*.dgf) 파일과 지오이드 그리드(*.ggf) 파일을 가지고 작업하고자 할 때 Trimble Grid Factory 유틸리티를 사용합니다.

이 유틸리티를 사용하여 기존의 그리드에서 서브 그리드를 만들거나, 혹은 다수의 기존  그리드를 하나의 새로운 그리드로 결합합니다. Trimble Geomatics Office 사용하여 데이텀 그리드 파일과 지오이드 그리드 파일을 서브 그리드로 만들 수 있습니다.

Grid Factory 유틸리티로 지오이드 그리드 파일을 만들려면 입력하는 새 파일 명이 Trimble Coordinate System Manager� 유틸리티에서 만드는 지오이드 모델 명과 같아야 합니다.

포괄 대상 지역의 면적이 크면 그리드도 커집니다.

예를 들어, OSU91 지오이드 그리드는 크기가 대략 2 Mb정도입니다. 전자 야장과 수신기는 보통 이 정도 크기의 데이터를 수용할 만한 여유 메모리가 없습니다. OSU91 그리드의 대상 영역은 지구 전체이지만 대부분의 측량사들은 그처럼 넓은 지역을 다루지 않습니다.  통상적으로 측량사들이 다루는 지역은 수십 내지 수백 평방 킬로미터에 불과합니다. 그 이하의 면적을 다루는 그리드의 크기는 보통 수 백 바이트에 불과합니다.

Grid Factory 유틸리티로 지오이드 모델의 서브 그리드 파일을 만들어 제한된 지역을 다룰 수 있습니다. 이  파일은 크기가 작아 Trimble Survey Controller (버전 6 또는 그 이후 버전)가 실행중인 장치에 업로드해서 특정 지역을 위해 쓸 수 있습니다.

Trimble사의 여러 제품에는 데이텀 변환과 지오이드 모델링용 그리드 파일이 딸려 있으므로 이를 Grid Factory 유틸리티에서 사용할 수 있습니다.  Grid Factory 유틸리티는 또한 타사의 그리드 파일도 받아들여 Trimble 그리드 포맷으로 변환합니다.

자세한 사항은 Trimble Grid Factory 유틸리티의 도움말을 참조하십시오.


DC File Editor

Trimble DC File Editor™ 유틸리티로 Survey Controller (*.dc) 파일을  편집할 수 있습니다.

이 기능을 사용하려면, 다음 중 하나를 실행합니다:

  열린 프로젝트가 없을 때는 [유틸리티 / DC File Editor]를 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

참조: Trimble 사는 모든 편집을 Trimble Geomatics Office로 완료할 것을 권장합니다. 이는 원본 장치 파일을 항상 보유하기 때문에 Trimble Geomatics Office로 편집하는 중 문제가 발생할 경우 다시 원본 파일을 이용할 수 있기 때문입니다.

Trimble의 DC File Editor를 사용하면 다음의 장치에서 가져온 파일들을 편집할 수 있습니다:

  Trimble

  Sokkia SDR (버전 4-03이하 )

  SDR 포맷으로 변환될 수 있는 모든 장치 파일

.dc 파일의 내용을 편집하려면 Trimble DC File Editor를 사용합니다.  예를 들어, 현장에서 수집한 데이터 오류를 수정하거나 또는 현장에서 구할 수 없는 정보를 추가할 수 있습니다.

참조: 속성은 편집할 수 없고, 피쳐 및 속성 라이브러리 정보도 변경할 수 없습니다.

자세한 정보는 Trimble DC File Editor 유틸리티의 도움말을 참조하시기 바랍니다.


Feature and Attribute Editor

Trimble Feature and Attribute Editor ™ 유틸리티를 사용하여 피쳐 코드 처리와 GIS 속성 데이터 수집을 하기 위한 피쳐 및 속성 라이브러리 (*.fcl) 파일을 관리합니다.

이 기능을 사용하려면, 다음 중 하나를 실행합니다:

  열린 프로젝트가 없을 때는 [유틸리티 /  Feature and Attribute Editor]를 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

Trimble Feature and Attribute Editor 유틸리티를 사용하여 피쳐 및 속성 라이브러리 파일을 보거나 편집할 수 있습니다. 피쳐 및 속성 라이브러리는 다음 경우에 사용합니다:

  피쳐 코드 처리

  속성 수집

.fcl 파일은 텍스트 파일이며,  피쳐, CAD 스타일, 제어 코드의 정의가 들어있습니다. 피쳐 정의에는 다음 사항이 포함될 수 있습니다:

  피쳐에 대한 코드

  해당 포인트와 연관된 피쳐를 가진 포인트들에 수행할 CAD 절차

  피쳐가 요하는 속성

새로운 피쳐 및 속성 라이브러리를 만들 수도 있습니다.  또한 Trimble Geomatics Office에서 기본 설정으로 된 피쳐 및 속성 라이브러리를 그대로 쓰거나, 혹은 개별적인 필요조건에 맞게 이를 수정할 수 있습니다.

자세한 정보는 Trimble 피쳐 및 속성 편집기의 도움말을 참조하시기 바랍니다.


Coordinate System Manager

Trimble Coordinate System Manager™ 유틸리티를 쓰면 좌표계 데이터베이스(Current.csd)를 이용할 수 있습니다.

이 기능을 이용하려면, 다음 중 하나를 실행합니다:

  열린 프로젝트가 없을 때는 [유틸리티 / Coordinate System Manager]를 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

Trimble Coordinate System Manager 유틸리티로 다음 사항을 새로 정의할 수 있습니다:

  타원체 매개 변수

  데이텀 변환

  좌표계

  사이트 정의

  지오이드 모델

참조: 대다수 사용자들은 Trimble Coordinate System Manager 유틸리티를 사용할 필요가 없습니다. Trimble 사가 다양하게 제공한 기존  좌표계 정의를 사용하시면 됩니다.  별도로 좌표계 정의를  추가하고자 할 때에만 Coordinate System Manager 유틸리티를 사용하십시오.

Trimble Geomatics Office는 좌표계 데이터베이스를 이용하여,  프로젝트에서 사용할 좌표계, 지오이드 모델 및 사이트를 선택합니다.

참조: 사이트는 Trimble Geomatics Office나  Coordinate System Manager 유틸리티에서 만들 수 있고, 지오이드 데이터베이스에 저장됩니다.

자세한 정보는 Trimble Coordinate System Manager 유틸리티의 도움말이나 Trimble Geomatics Office의 사용 설명서를 참조하십시오.


Planning

Planning 유틸리티를 이용하여 GPS 필드 세션을 계획하고 그 일정을 세울 수 있습니다. GPS 세션 계획에 앞서 GPS 측량의 적정 조건을 결정하기 위해 이 유틸리티를 사용합니다.

Planning 유틸리티를 이용하려면, 다음 중 하나를 실행합니다:

  열린 프로젝트가 없을 때는 [유틸리티 / Planning]을 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

과업에 대한 계획 수립은 통상적으로 측량 프로젝트 관리의 첫 단계가 됩니다. 그 목표는 프로젝트의 중요한 국면을 모두 정의해서, 예측 가능한 모든 조건 하에서 과업을 효과적이며 효율적으로 수행함에 있습니다.  실시간 kinematic  (RTK) 측량을 할 경우:

 최소한 4개의 위성을 확보해서 알려진 측점 초기화를 하고, 또한  5개의 위성을 확보해서 on-the-fly 초기화를 실행할 수 있는지 확인하는 용도에 Planning 유틸리티를 사용합니다.

  PDOP 값을 검사해서 위성 기하학적 조건이 정확한 실시간 측위를 하기에 적합한가를 확인합니다.

참조: Planning 유틸리티는 Trimble Geomatics Office 프로젝트와 직접적으로 연관되지 않아서  세션 설명을 저장하지 않습니다.  따라서 동일 프로그램을 실행하는 동안에만 세션을 정의해서 사용할 수 있습니다.

Planning 유틸리티는 다음과 같은 경우에 도움이 됩니다:

  테이블과 그래픽 표시로 위성의 가용성을 시각화하고 예측할 때

  위성의 선택, 위성력, 표준 시간대, 현장 시계 방해 및 임계 앙각을 실험할 때

  PDOP 및 현장 요원의 작업 시간대에 불가피하게 제약조건이 있어, 세션의 최상 관측 시기를 결정할 때

자세한 정보는 Planning 유틸리티에 있는 도움말을 참조하십시오.


Convert to RINEX

RINEX 포맷은 수신기로 수집한 GPS 데이터를 ASCII 코드화 한 것입니다. Convert to RINEX 유틸리티는 Trimble측량 수신기로 수집한  2진 .dat 포맷 파일을 ASCII RINEX 포맷 파일로 변환합니다. 이 유틸리티는 Trimble Geomatics Office와 상관없이 단독으로 실행할 수 있습니다.

Convert to RINEX 유틸리티를 사용하려면, 다음 중 하나를 실행합니다:

  열린 프로젝트가 없을 때는 [유틸리티 / Convert to RINEX]을 선택합니다

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

이 유틸리티는 다음 경우에 사용합니다:

  변환할 파일을 선택할 때

  변환 매개 변수를 구성할 때

  안테나와 헤더의 출력 파일 정보를 구성할 때

  선택한 파일을 RINEX 포맷으로 변환할 때

Convert to RINEX 유틸리티는 다음 세가지 형식의 RINEX 파일을 만듭니다:

  관측 파일 (기지국 안테나 정보가 있는 원시GPS 관측치)

  항법 파일 (GPS 궤도)

  기상 파일 (기압, 기온 및 상대 습도)

이 유틸리티는 RINEX 관측 파일과 RINEX 항법 파일을 기본으로 만듭니다.  또한 RINEX 기상 파일 만들기를 선택할 수도 있습니다.

자세한 정보는 Trimble Convert to RINEX 유틸리티의 도움말을 참조하십시오.


A1 Viewer

A1 Viewer 유틸리티를 이용하면 GPSurvey 프로젝트 아카이브 (*.A1) 파일의 내용을 보고, 선택한 파일을 대상 디렉토리로 추출(저장)할 수 있습니다. A1 Viewer 유틸리티는 GPSurvey는 독립적으로 실행되므로 이 소프트웨어를 컴퓨터에 설치하지 않아도 됩니다. GPSurvey 프로젝트 데이터 파일을 저장하고 나서,  Trimble Geomatics Office의 가져오기 기능을 이용하여 그 데이터를 현재 프로젝트로 가져올 수 있습니다.

A1 Viewer 유틸리티를 이용하려면,  다음 중 하나를 실행합니다:

 열려 있는 프로젝트가 없을 때 [유틸리티 / A1 Viewer]를 선택합니다.

  아무 때나 Microsoft Windows의  [시작] 메뉴에서 그것을 선택합니다.

GPSuyrvey좌표 가져오기

'GPSurvey 좌표] 옵션([curr_net.dat])'을 이용하면 Curr_net.dat 파일로부터 조정된 좌표를 가져올 수 있습니다. 이 기능을 이용하려면:

1.	[파일 / 가져오기]를 선택합니다. [가져오기] 대화 상자가 열립니다.

2.	[측량] 탭에서  'GPSurvey 좌표 (Curr_net.dat)'를 선택하고 [확인]을 누릅니다.  [열기] 대화 상자가 나타납니다.

참조: 파일 가져오기를 성공적으로 수행하려면, 파일이 curr_net.dat라는 이름을 가지고 있어야 합니다.

3.	해당 파일을 찾아 [확인]을 누릅니다.

그렇게 하면 Curr_net.dat 파일로부터 조정된 좌표를 가져올 수 있습니다.

A1 Viewer 유틸리티가 지원하는 파일

GPSurvey로 압축저장된 파일만 A1 Viewer로 볼 수 있습니다:

  .ssf/.ssk 파일 � 이 파일에는 GPSurvey WAVE 처리기에서 얻은 기선 해 결과가 들어 있습니다. 이 파일들을 SSF/SSK 파일 (*.ssf,*.ssf) 가져오기 포맷을 사용하여 Trimble Geomatics Office 프로젝트로 가져 올 수 있으며, 이 포맷은 [가져오기] 대화 상자의 [측량]탭에 있습니다.

  GPS 데이터 파일 �  이 파일에는 현장에서 수집한  원시 GPS  데이터가 들어 있습니다. 이 필터를 선택하면 두 가지 형식의 파일�*.dat (Trimble 수신기에서 받은 원시 GPS 데이터 파일) 과 *.rnx (WAVE 처리기용으로 변환한 원시 RINEX 데이터 파일 )�을 이용할 수 있습니다.  마찬가지로, 이 두 형식의 파일 (.dat와 .rnx) 은 GPS 데이터 (*.dat) 파일 가져오기 포맷을 이용하여 프로젝트로 가져올 수 있습니다.

참조: [가져오기] 대화 상자에서 [GPS 데이터 파일] 포맷옵션을 선택한 후 [열기] 대화 상자가 나오면 [파일 형식] 필드에서 '모든 파일 *.*'을 선택합니다. 그러면 사용 가능한 모든 *.rnx 파일을 볼 수 있습니다.

  조정된 좌표 파일 � Curr_net.dat 파일과  Coords.log 파일에는 GPSurvey 아카이브 프로젝트에서 온 조정된 좌표가 들어있습니다.  이 중Curr_net.dat 파일은 좌표를  Trimble Geomatics Office로 가져올 때 사용합니다. Coords.log 파일은 ASCII 포맷으로 되어있고 텍스트 편집기로만 볼 수 있습니다. GPSurvey 프로젝트의  포인트는 지리학적 좌표 포맷, 그리드 좌표 포맷, 또는 다른 좌표계로 되어 있습니다. 좌표 가져오기를 제대로 실행하려면, Trimble Geomatics Office 프로젝트 좌표계 등록정보의 좌표계가 GPSurvey 프로젝트 좌표계 등록정보와 정확히 일치해야 합니다.

이 파일 (Curr_net.dat) 은 GPSurvey 좌표 (Curr_net.dat) 가져오기 포맷을 이용하여 프로젝트로 가져옵니다. 이 파일 (Curr_net.dat) 을 읽어 들일 때 소프트웨어가 GPSurvey 조정 중 고정된 좌표를 확인합니다. 파일에 최소한 하나 이상의 고정 좌표(NE, e, h )가 있어야, 같은 유형의 좌표 성분을 모두 가져올 수 있습니다. 예를 들면, 하나의 고정 표고가 있어야 다른 표고를 모두 가져 올 수 있습니다. 가져온 모든 구성요소에는 기준 등급이 부여됩니다.

  .ggf 파일 � 이 파일에는, GPSurvey 프로젝트에서 만들었거나 또는 외부에서 그 프로젝트로 가져 온 로컬 지오이드 그리드(*.ggf) 파일의 지오이드 데이터가 들어있습니다. 이 파일은 TRIMNet Plus 소프트웨어에 있는 잔차 지오이드 모델링 기능을 이용하여 만듭니다. 이 필터는 GPSurvey소프트웨어에서 이용 가능했던 Global .ggf 파일 (즉, WW15MGH, GEOID99)은 표시하지 않습니다.  .ggf 파일을 Trimble Geomatics Office에서 사용하려면,  .ggf 파일을  Program Files\Common Files\Trimble\GeoData 폴더에 저장하고 나서, Coordinate System Manager 유틸리티를 사용하여 해당 지오이드를 좌표계 데이터베이스에 추가하면 됩니다.  이 유틸리티 사용에 관한 자세한 정보는 Coordinate System Manager 유틸리티의 도움말을 참조하시기 바랍니다.

TRIMNet Plus에서 One-Height 모드 사용

TRIMNet Plus의 One-Height 모드를 이용해 어떤 프로젝트에서 GPSurvey 좌표를 가져올 때,Trimble Geomatics Office 프로젝트의 타원체고 필드에는 표고 값이 들어있습니다. 이는 One-Height모드 조정 중, TRIMNet Plus가 타원체고 필드를 표고 값 (정표고)으로 사용하기 때문입니다. GPSurvey 프로젝트에서 어떤 모드를 사용했는지 모를 때에는 GPSurvey에서 그 프로젝트를 열고, TRIMNet Plus의 특별제어 설정을 확인하면 됩니다.

정밀 궤도력 정보 사용

GPSurvey 프로젝트 아카이브 기능은 WAVE 소프트웨어의 기선 처리 과정에서 사용한 정밀 위성 궤도력 정보를 압축 저장 하지 않습니다. 만약 정밀 위성 궤도력 정보가 GPSurvey 프로젝트의 기선 처리과정 중에 사용되었다면, 원래의 출처에서 Trimble Geomatics Office로 이 정보를 가져와야 합니다.


NGS 안테나 모델

두 안테나 모델 세트 뾗rimble 또는 NGS� 중 하나를 Trimble Geomatics Office에서 사용할 수 있습니다. 측량의 필요 요건에 따라 사용할 안테나 모델 세트를 결정합니다.  일반적으로 Antenna.ini 파일에 정의된 것과 다른 유형의 안테나를 쓸 때에는NGS 안테나 세트를 사용합니다.

Trimble 안테나 세트가 기본 설정으로 설치되어 있습니다. 그러나, NGS 안테나 모델을 설치하고자 할 때에는 [GPS 기선 처리 스타일] 대화 상자의 [일반] 탭 하의 안테나 모델 목록 중에서 NGS 옵션을 선택하십시오.


보증서

소프트웨어 및 펌웨어의 제한적 보증

Trimble은 인도일을 기산일로 하여 90일 동안 Trimble 소프트웨어 제품(이하 '소프트웨어')을 소프트웨어에 대한 대외 공표 사양에 실질상 부합되게 할 의무가 있습니다.

보증의 구제

상기의 보증에 의거, Trimble의 유일한 의무이자 사용자의 유일한 구제는 상기 보증에 부합하지 못하는 제품이나 소프트웨어('미부합 제품')을 Trimble의 재량에 의하여 교체 또는 수리해 드리거나, 아니면 이 미부합 제품의 Trimble 반환시 해당 구입가를 환불해 드리는 것입니다.

보증의 제외

이 보증은 (i) 제품이나 소프트웨어를 Trimble 의 사용자 매뉴얼과 사양에 맞게 올바로 설치 , 설정, 인터페이싱, 저장, 관리, 작동하고 (ii) 제품이나 소프트웨어를 개조하거나 잘못 사용하지 않은 경우에만 적용됩니다. 앞의 보증은 (i)제품이나 소프트웨어를 Trimble이 제조, 제공, 허용하지 않는 제품이나 정보, 시스템, 장치와 같이 씀으로서 야기되는 하자나 성능 저하 ; (ii) 제품이나 소프트웨어를 Trimble 표준 사양 이외의 사양에서 사용; (iii) 제품이나 소프트웨어의 임의 변형이나 임의 사용; (iv) 번개나 기타 전기 방전, 담수/염수에 의한 침수/분무로 인한 손상; (v) 소모성 부품(배터리 등)의 자연적 마모 등을 이유로 하는 보증 요구에는 적용되지 않고 Trimble이 아무 책임도 지지 않습니다.

상기의 보증이 제품과 소프트웨어의 성능과 관련, Trimble이 지는 유일한 책임이자 사용자가 받는 유일한 구제입니다. 약정서에 명백히 표시된 사항을 제외하고 Trimble은 제품과 소프트웨어를 명시적이거나 묵시적인 일체의 보증 없이 '있는 그대로' 공급하므로 특정 목적에의 상품성이나 적합성에 대한 묵시적 보증은 명백히 배제됩니다. 언급된 명시적 보증은 제품이나 소프트웨어로부터 직접 또는 간접적으로 발생하는 모든 책임과 의무를 대신합니다. 묵시적 보증 배제를 허용하지 않는 관할권에서는 상기의 배제 사항이 적용되지 않을 수 있습니다.

책임의 제한

법이 허용한 최대한의 범위 내에서 Trimble은 제품이나 소프트웨어와 관련하여 어떤 상황이나 법적 이론 하에서든 간접, 특수, 파생적인 일체의 손해에 대하여(그와 같은 손해의 가능성에 대하여 사전에 알았다 하더라도) 책임을 지지 않습니다. 관할권에 따라서는 파생적, 부수적 손해에 대한 책임의 배제나 제한을 허용하지 않는 경우가 있으므로 상기 제한이 사용자에게 적용되지 않을 수도 있습니다.

어떤 경우에서든 이 약정에 의한, 또는 이 약정의 위배로 인한 Trimble의 유일한 책임과 사용자의 유일한 구제는 제품이나 소프트웨어의 구입가나 라이센스 비를 환불하는 것으로 제한됩니다.


감사합니다

Trimble Geomatics Office™ 도움말을 이용해 주셔서 감사합니다.

이 도움말에는 Trimble Geomatics Office 소프트웨어의 기능을 최대한 활용함과 동시에 효과적으로 이용하기 위한 정보가 담겨 있습니다. 또한 Trimble Geomatics Office를 설정하고 사용하는 방법도 들어 있습니다.

  도움말 이용하기

  Trimble Geomatics Office � 개요

  Trimble 안내

  피드백


[새 창] 명령

현재의 프로젝트에 또 하나의 창을 열고자 하면 이 명령을 이용합니다.

이 기능을 이용하려면 [창 / 새 창] 명령을 선택합니다.

각각의 새 창이 [창] 메뉴에 있는 창 목록에 추가 됩니다.

새 창은 활성 창과 같은 내용을 가지게 됩니다. 프로젝트의 다른 부분 또는 다른 화면을 보고자 할 때 다수의 창을 동시에 열 수 있습니다. 예를 들면, 여러 창을 열어 프로젝트의 서로 다른 레이어가 각 창에 보이게 할 수 있습니다.

어떤 창에서 내용을 바꾸면 동일한 프로젝트를 포함하는 다른 창 모두에서도 해당 내용의 정보가 바뀝니다.

새로운 창을 열면 그 창이 활성 창이 되어, 열려있는 다른 창들의 위에 나타납니다.


[계단식 배열] 명령

열려있는 다수의 프로젝트 창들이 계단식으로 서로 겹치게 보이도록 하려면 이 명령을 이용합니다.

이 기능을 이용하려면 [창 / 계단식 배열] 명령을 선택합니다.

창들이 서로 겹쳐 보이므로 각 창의 제목을 모두 볼 수 있습니다.


[바둑판식 배열] 명령

현재 열려있는 모든 프로젝트 창들을 바둑판식으로 배열하고자 하면 이 명령을 이용합니다.

이 기능을 이용하려면 [창 / 바둑판식 배열] 명령을 선택합니다.

창들이 바둑판 모양으로 정렬됩니다.


[아이콘 정렬] 명령

축소된 창의 아이콘을 모두 화면상에 정돈된 형태로 재배열하려면 이 명령을 이용합니다.

이 기능을 이용하려면 [창 / 아이콘 정렬] 명령을 선택합니다.

축소된 아이콘들이 창의 하단에 정렬됩니다.


[분할] 명령

한 프로젝트의 두 부분을 동시에 보고자 하면 이 명령을 이용합니다.

이 기능을 이용하려면 [창 / 분할] 명령을 선택합니다.

분할 막대를 클릭하여 끌면 창의 크기가 조절됩니다. 한 부분의 내용을 변경하면 다른 부분의 내용도 동시에 변경됩니다.


표시 목록 명령

표시 목록에 있는 창을 불러오려면 이 명령을 이용합니다. 표시 목록에는 열려있는 창들이 모두 나열됩니다.

이 기능을 이용하려면 창 표시 목록에서 해당 창을 선택합니다.


World Wide Web 사이트

저희 인터넷 사이트에 오시면 최신 Trimble 정보를 얻으실 수 있습니다.
(www.trimble.com/)


등록 정보 창 - 개요
등록 정보 창 − 개요

등록 정보 창은 모든 개체(포인트, 관측치, 선, 호, 곡선, 텍스트, 주석, 비고)에 관한 정보를 보여줍니다.

등록 정보 창을 통해 선택 개체의 등록 정보를 보거나 편집할 수 있습니다. 한번에 하나의 개체만을 볼 수 있으며, 등록 정보 창에서 개체에 어떤 변경을 하면 이는 바로 적용됩니다.

등록 정보 창의 틀을 클릭한 후 끌어서 등록 정보 창의 크기를 조절 할 수 있습니다. 창을 닫으려면 오른쪽 상단 코너의 단추를 클릭합니다.

등록 정보 창을 열어 놓은 상태로 Trimble Geomatics Office의 다른 부분들을 사용 할 수도 있습니다.  등록 정보 창은 해당 선택 집합에 대한 정확한 정보를 보여주기 위해서 자동으로 업데이트 됩니다.

사용자가 현재의 선택 집합을 정의하고 등록 정보 창의 선택 부분 목록에서 보고자 하는 개체를  선택한 경우, 그래픽 창에 있는 현재 선택 부분은 사용자자 현재 보고있는 개체만을 포함하여 업데이트 합니다. 등록 정보 창 선택 부분 목록은 원래의 선택 집합을 유지합니다. 등록 정보 창 선택 부분 목록에서 하이라이트된 개체들이 그래픽창의 현재 선택 집합이 됩니다.

등록 정보 창의 나무계층구조 보기는 선택한 항목의 이름과 값을 화면에 보여줍니다. 나무계층 구조 보기는 개체들간의 상관관계를 보여줍니다. 즉, 플러스(+) 기호를 클릭하여 어떤  포인트를 선택하면 그 관측치나 선 형식 개체에 대한 "시점" 과 "종점"을 볼 수 있습니다.

노드(node)에서 보기 상태를 접거나 펼칠 수 있습니다.

  플러스 (+) 기호를 클릭하면 나무 계층 구조 보기가 펼쳐집니다.

  마이너스 (-) 기호를 클릭하면 나무 계층 구조 보기가 접혀집니다.

등록 정보 창의 오른쪽에 나타나는 정보와 탭들은 현재 선택한 개체의 종류에 따라 달라집니다.

등록 정보 창 선택 도구

등록 정보 창의 선택 도구를 이용하여 선택 부분 목록을 구성 할 수 있습니다.

선택	아이콘	용도
측량 데이터 그룹화		측량 데이터를 출처나 데이터 형, 관측 방향별로 그룹화합니다.
정렬		선택 부분의 목록에 있는 개체를 정렬합니다. 원하는 옵션을 목록에서 선택하는데, 정렬 기준은 데이터베이스 순서나 표고, 이름, 질 등급, 시작 시간, 선점 지속 시간, 데이터 형 등입니다.
필터		포인트나 관측치, 플래그가 붙은 관측치, 현재 선택 집합만을 유지합니다. 또한 현재의 선택 부분을 제거할 수도 있습니다. 참조: 사용자 정의의 질의를 필터 목록에 추가할 수 있습니다.
질 표시기

요약 페이지의 각 필드 오른쪽에 나타나는 작은 심볼들을 질 표시기라 합니다. 이 심볼들은 측량 데이터의 질을 나타냅니다. 질 등급에는 고정 기준, 기준, 측량, 매핑, 미지 또는 조정 등급이 있습니다. 이 질 표시기는 도출 보고서 와 재계산 보고서에도 사용됩니다.

지오이드 표시기

지오이드 표시기는 포인트의 표고 또는 타원체고 구성 요소가 프로젝트의 정의 지오이드로부터 도출되었는지를 보여줍니다. 지오이드 표시기는 질 표시기와 함께 나타납니다.

예를 들어, 한 RTK점을 측정하면, 지오이드로부터 도출된 WGS-8고와 표고를 갖습니다. 비 GPS 포인트를 수집할 경우에도 지오이드로부터 도출된 표고와 WGS-84고를 가집니다.

지오이드 표시기는 도출 보고서와 재계산 보고서에도 사용됩니다.

지오이드 모델의 지오이드 질은 [프로젝트 등록 정보] 대화 상자의 재계산 [탭]에서 결정됩니다.

'자동 롤업' 도구

그래픽 창에서 개체를 선택 중일 때 이 도구 [image] 를 써서 등록 정보 창을 최소화합니다.

창 열기 잠금

등록 정보 창이 열려 있을 때 이것이 동일한 크기를 유지하도록 하기 위하여 이 도구 [image] 를 씁니다.


등록 정보 창 - [측량] 탭 - 개요
등록 정보 창 − [측량] 탭 − 개요

선택 부분에 있는 어떤 개체의 측량 관련 등록 정보를 보거나 편집하고자 할 경우에 [측량] 탭을 사용합니다. 측량 보기 화면에서 보이는 개체들의 등록 정보를 볼 수 있으며, 예를 들면 다음과 같은 것들이 있습니다.

  포인트

  GPS 관측치

  광파 관측치

  레벨 관측치

  레이저 거리계 관측치

  축소 변환 관측치 (옵셋)

페이지

측량 정보는 여러 페이지로 정리되어 있습니다. 한번에 한 페이지만 볼 수 있습니다. 이용 가능한 메뉴 단추를 이용하여 이 페이지들을 볼 수 있습니다.  메뉴 단추들을 이용하면 모든 해당 측량정보를 볼 수 있으며, 현재 선택한 개체의 종류에 따라 메뉴 단추가 다르게 됩니다.

포인트와 관측치 삭제

포인트 또는 관측치를 삭제하려면 등록 정보 창의 [삭제] 단추 [image] 를 이용합니다. 포인트 또는 관측치를 삭제할 수 없는 경우에는 [삭제] 단추가 비활성화 됩니다.

참조: 고정 좌표는 삭제할 수 없습니다. 고정 좌표를 삭제하려면, 먼저 고정을 해제해야 합니다.


등록 정보창 - [측량]탭 - 포인트
등록 정보창 − [측량]탭 − 포인트

 개요

선택한 포인트의 측량 관련 정보를 보거나 편집하려면 등록 정보 창의 [측량] 탭을 이용합니다. 측량정보는 해당 페이지에 정리되어 있습니다.

해당 메뉴 단추를 클릭하면 아래와 같은 페이지들이 나옵니다.

요약
경고
선점 및 설정
추정 오차


등록 정보 창 - [측량]탭 - 점 - 요약 페이지(포인트)
등록 정보 창 − [측량]탭 − 요약 페이지(포인트)

추가 정보

 방법

선택한 포인트의 도출 위치와 질을 보려면 등록 정보 창의 요약 페이지를 이용하면 됩니다.

이 페이지들을 보려면, 등록 정보 창을 열고:

 [측량] 탭 하에서  [요약]  메뉴 단추 [image] 를 클릭합니다.

포인트 이름

포인트의 이름을 표시합니다. 이름을 변경하려면, 이 필드에 새 값을 입력합니다.

좌표 필드

포인트의 도출된 위치와 각 구성 요소에 지정된 질을 표시합니다. 디스플레이 옵션 설정 여하에 따라 나오는 좌표 필드가 달라집니다.

그리드 / 로컬 / WGS-84

포인트의 좌표 화면 표시 옵션을 선택합니다.

참조: 이 옵션이WGS-84이면, 표시되는 좌표 필드들은 [프로젝트 등록 정보] 대화 상자의 [단위와 포맷]탭에서 선택한 WGS-84표시 형식에 따라 결정됩니다. 예를 들어, [WGS-84표시 형식] 필드가 L,L,H로 설정되어 있으면, 요약 페이지의 좌표 필드들은 위도,경도,타원체고로 표시됩니다. [WGS-84표시 형식]이 X,Y,Z이면, WGS-84선택시 그 필드들은 X, Y, Z로 표시됩니다.

도출 보고서

도출 보고서 가 나타나게 하려면 [도출 보고서] 도구 [image] 를 선택합니다.

새 좌표 추가

그리드, 로컬 또는 사무실 입력 WGS-84 좌표 (사무실 입력좌표를 관측치에서 도출한 좌표에 우선해서 사용하고자 하는 경우 )를 키입력하려면 [좌표 추가] 도구 [image] 를 선택합니다. 키입력한 좌표는 사무실 입력 출처(Office-entered source)를 가집니다.

한 포인트와 관련하여 오직 하나의 그리드 (또는 로컬) 좌표와  또 하나의 WGS-84 사무실 입력좌표 만을 가질 수 있습니다.  WGS-84 좌표와 그리드 (또는 로컬) 좌표가 이미 존재하는 경우, [좌표 추가] 도구는 이용할 수 없습니다.

참조: 좌표를 추가하는 경우, 좌표 구성 요소 필드와 질은 공백값입니다. 현재의 포인트 위치와 질을 입력하려면, [현재 값 삽입] 도구 [image] 를 선택하면 됩니다.


등록 정보 창 - [측량] 탭 - 경고 페이지
등록 정보 창 − [측량] 탭 − 경고 페이지

측량 보기에서 포인트 또는 관측치에 나타나는 경고 플래그의 관련 메시지를 보거나 보지 않게 하려면 경고 페이지를 이용합니다.

이 기능을 이용하려면,

1.	다음 중에 한가지를 실행합니다.

  보기 원하는 경고 표시 플래그가 있는 포인트 또는 관측치를 더블 클릭합니다.

  경고 표시 플래그가 있는 포인트를 모두 선택하려면, 상태 표시줄에 있는 경고 플래그  아이콘을 더블 클릭합니다.

등록 정보 창이 나타납니다.

2.	선택 부분에 1개를 초과하는 개체가 있을 경우, 보고싶은 개체 하나만을 선택합니다.

3.	경고 페이지를 보기 위해서는 경고 메뉴 단추 [image] 를 클릭합니다.

좌표의 [내보내기] 작업을 하기 전에 모든 경고 플래그 문제를 해결하거나 제거해야 합니다. 만약 관측치가 물리적으로 다른 포인트를 대상으로 한 경우에는 포인트의 이름을 변경하거나 불량 관측치를 불이용 상태로 만들어 허용 편차 밖의 폐합을 해결하면, 오류 플래그가 없어집니다.

다음의 표는 경고 플래그와 함께 나타날 수 있는 메시지들을 보여 줍니다.

이 메시지 억제

측량에 오류가 허용되는 경우, 선택한 포인트나 관측치의 경고 플래그를 억제하려면 이 확인란을 선택합니다. 플래그는 등록 정보 창에서 흰색으로 변하고 그래픽 창으로부터 사라집니다.

참조: 모든 경고 표시 플래그를 억제하면, 상태 표시줄의 플래그 아이콘이  흰색으로 변합니다.

포인트가 선택되어 있는 경우, 포인트 도출 보고서 를 보기위해서  [포인트 도출] 도구 [image] 를 선택할 수 있습니다.

포인트의 위치가 어떻게 도출되었고 왜 오류가 발생했는지 알기 위해서 이를 사용합니다.


등록 정보 창 - [측량] 탭 - 선점 및 설정 페이지
등록 정보 창 − [측량] 탭 − 선점 및 설정 페이지

이 페이지는 등록 정보 창에서 선택한 포인트 또는 관측치의 GPS선점이나 비GPS 설정 내역을 보거나 수정하는 데 사용됩니다.

선택한 개체의 종류와 사용된 측량 방식에 따라 다음과 같은 페이지들이 나타납니다.

이 페이지들을 보기 위해서는, 등록 정보 창을 열고,

1.	해당 관측치를 선택합니다.

2.	[선점 및 설정] 메뉴 단추 [image] 를 클릭합니다.

참조:  해당 포인트에 1개를 초과하는 선점 또는 설정이 존재하는 경우, 바로가기 메뉴가 나타납니다. 보고싶은 페이지를 선택합니다. 바로가기 메뉴에서 다른 선점 또는 설정에 마우스를 옮겨 놓으면, 페이지에 내역들이 업데이트 됩니다.

하나의 포인트는 1개를 초과하는 선점을 가질 수 있지만, 하나의 관측지는 하나의 "시점"과 하나의 "종점"만 가집니다.


등록 정보 창 - [측량] 탭 - GPS 선점 페이지
등록 정보 창 − [측량] 탭 − GPS 선점 페이지

이 페이지는 선택한 포인트의 GPS 선점 내역을 보거나 수정하는데 사용됩니다. 해당 포인트가 이전에 기지국이나 로버 위치로 사용되었으면 페이지의 내용은 동일합니다.

이 페이지들을 보기 위해서는 등록 정보 창을 열고,

1.	[측량] 탭을 선택합니다.

2.	다음 중에 한가지를 실행합니다.

  포인트가 이미 선택된 경우, [선점 및 설정] 메뉴 단추 [image] 를 클릭합니다.

참조: 1개를 초과하는 포인트 또는 설정이 존재하는 경우, 바로가기 메뉴가 나타납니다. 보고싶은 페이지를 선택합니다.

  GPS관측치를 선택한 경우, [베이스 선점] 메뉴 단추 [image] 를 클릭하면, 베이스선점 내역을 볼 수 있습니다. [로버 선점 ] 메뉴 단추 [image] 를 클릭하면, 로버 선점 내역을 볼 수 있습니다.

포인트

선점된 포인트의 이름을 표시합니다.

시간

선점 시작 시간과 선점 지속 시간을 표시합니다.

참조: 데이터를 외부로부터 가져오는 경우, 시작 및 종료 시간은 GPS시간에서 UTC(협정 세계시 - 실제로는 그리니치 표준시)로 변환되고, 다시 Microsoft Windows에 설정된 현재의 표준시로 표시됩니다.

팁: 포인터를 이 필드 위에 두면 선점 종료 시간의 도구팁이 나옵니다.

안테나내역

[안테나 내역] 상자는 관측된 포인트의 선점에 사용된 GPS안테나 내역을 포함합니다.

높이

안테나 높이를 표시합니다. 선점 중 타원체고가 잘못 입력된 경우, 키보드로  새 값을 입력하여 필드를 변경 할 수 있습니다.

종류

수신기에 연결된 안테나의 종류를 표시합니다. 선점 중 안테나가 잘못 입력된 경우, 목록에서 새 안테나의 종류를 선택하면 됩니다.

높이 지점

안테나 높이가 어디까지 측정되었는지를 표시합니다. 선점 중 방법이 잘못 입력된 경우, 목록에서 새 옵션을 선택하면 됩니다.


등록 정보 창 - [측량] 탭 - 측량기 설정 페이지
등록 정보 창 − [측량] 탭 − 측량기 설정 페이지

이 페이지는 관측에 사용된 광파 측량기의 설정 내역을 보거나 수정하는 데 사용됩니다.

이 페이지를 보기 위해서는, 등록 정보 창을 열고,

1.	[측량] 탭을 선택합니다.

2.	어떤 포인트를 선택한 후 [선점 및 설정] 메뉴 단추 [image] 를 클릭합니다.

참조: 해당 포인트에 1개를 초과하는 선점 또는 설정이 존재하는 경우, 바로가기 메뉴가 표시됩니다. 보고싶은 측량기 설정 페이지를 선택합니다. 해당 포인트에 대한 모든 선점(GPS와 비GPS)을 이 페이지에서 볼 수 있습니다.

기계점

관측치가 구해진 해당 포인트의 이름을 표시합니다.

기계고

관측치가 구해졌을 때의 측량기의 높이를 표시합니다. 해당 타원체고가 설정 중에 잘못 입력된 경우, 키보드로  새 값을 입력하여 필드를 변경 할 수 있습니다.

후시점

관측된 후시점의 이름을 표시합니다.

후시 방위각

관측된 후시로의 계산 방위각을 표시합니다.

참조: 후시점이 좌표를 갖는 경우, 이 좌표들은 후시점으로의 방위각을 결정하는데 사용됩니다. 키 입력 방위각이 있으면, 키 입력 방위각의 질이 후시점 좌표를 사용하여 계산 방위각의 질과 비교되며, 가장 높은 질을 가진 방위각이 사용됩니다. 양자의 질이 동일한 경우에는 계산 방위각이 사용됩니다.


등록 정보 창 - [측량] 탭 - 타겟설정 페이지
  등록 정보 창 − [측량] 탭 − 타겟설정 페이지

[타겟 설정] 페이지는 광파 관측에 사용된 타겟 설정 내역을 보거나 수정하는데 사용됩니다.

이 페이지를 보기 위해서는, 등록 정보 창을 열고,

1.	[측량] 탭에서 광파 관측치를 선택합니다.

2.	[타겟 설정] 메뉴 단추 [image] 를 클릭하면 타겟 설정 내역이 표시됩니다.

전시점

전시점의 이름을 표시합니다.

타겟 높이

전시 관측치가 얻어진 때의 타겟의 높이를 표시합니다. 설정 중 타원체고가 잘못 입력된 경우, 키보드로 새 값을 입력하여 필드를 변경 할 수 있습니다.

프리즘 상수

관측치에 적용된 타겟의 프리즘 상수를 표시합니다. 상수가 입력되지 않았거나 설정 중 타원체고가 잘못 입력된 경우, 키보드로 새 값을 입력하여 필드의 내역을 변경할 수 있습니다.

관측치가 파일에서 이미 프리즘 상수의 적용을 받았고 그 상수가 무엇인지 파일에 명시되어 있지 않을 경우에는 이 필드에 '?'가 표시될 수도 있습니다. 설정 도중 오류가 발생했고 프리즘 상수가 부정확하게 입력되었다면, 필드의 실제 입력 프리즘 상수와 올바른 입력 상수와의 차이를 적용하도록 합니다. 예를 들어,  필드에 �20�을 입력했지만 실제로는 �5�를 입력하여야 했었다면 프리즘 상수 필드에 뱰15�라는 정정값을 입력하도록 합니다.


등록 정보 창 - [측량] 탭 - GPS 좌표 (안테나 페이즈 센터) 페이지
 등록 정보 창 − [측량] 탭 − GPS 좌표 (안테나 페이즈 센터) 페이지

이 페이지를 이용하면 GPS위치해를 볼 수 있습니다. 위치해는 다음으로부터 구할 수 있습니다.

  차동 GPS

  Wide Area Augmentation System (WAAS)

  Trimble Survey Controller에서 [image] 키 사용

  단독측위 위치

 VRS � wide area RTK (고정 및 유동)

포인트에 대한 위치해는 포인트가  측량 등급이나 매핑 등급일 경우에 표시됩니다. 1개를 초과하는 위치해를 가질 수 있으나 편집은 불가능합니다.

이 페이지들을 보기 위해서는, 등록 정보 창을 열고,

1.	그래픽 창에서 GPS좌표를 가진 포인트를 클릭합니다.

2.	등록 정보 창의 나무계층 구조에 있는 포인트를 확대합니다.

3.	나무계층 구조 [image] 에서 C?soln을 선택합니다. 여기서 ? 는 좌표 번호를 표시합니다.

GPS좌표 (안테나 페이즈 센터) 페이지가 표시됩니다.

포인트

포인트 이름을 표시합니다.

위도, 경도, 타원체고

포인트에 대한 정해진 포인트 질과 WGS-84좌표를 표시합니다.

참조: 표시된 타원체고는 선점에 사용된 GPS안테나의 안테나 페이즈센터의 타원체고입니다. 안테나의 높이는 적용되지 않습니다.

처리기 형

처리 방식(예: WAAS, wide area RTK)을 표시합니다.

상태

위치해의 상태를 표시합니다. 이 상태는 재계산이나 측량계산을 할 때 고려됩니다. 이 필드를 수정하려면, 화살표를 클릭하고 포인트에 적용하고자 하는 옵션을 드롭다운 목록으로부터 선택하면 됩니다.


등록 정보 창 - [측량] 탭 - 좌표 페이지
등록 정보 창 − [측량] 탭 − 좌표 페이지

추가 정보

 기타

이 페이지는 선택한 포인트의 좌표 보기에 이용합니다. 좌표의 질과 상태를 변경함에도 이용합니다.

포인트는 하나의 WGS-84와 하나의 그리드 (로컬) 좌표, 그리고 조정된 좌표들을 가질 수 있습니다. 조정된 좌표는 망 조정 (망 조정모듈이 설치된 경우)을 수행 후 구해집니다.

포인트의 좌표를 보기위해 요약 페이지 를 이용할 수도 있습니다.

이 페이지들을 보기 위해서는, 등록 정보 창을 열고,

1.	그래픽 창에서 해당 포인트를 더블 클릭 합니다. 등록 정보 창 이 나타납니다.

2.	포인트에 대한 나무계층 구조를 펼치고 해당 좌표를 선택합니다.

포인트에 대한 좌표가 표시됩니다.

좌표 필드

포인트의 좌표 구성 요소 값과 그 값에  지정된 등급을 표시합니다. 선택한 표시 옵션에 따라 나오는 좌표 필드들이 달라지는데, 이 필드들은 저장된 좌표형과 이 현재 보기가 동일한 경우에만 변경할 수 있습니다.

그리드 / 로컬 / WGS-84

포인트에 대한 좌표 표시 옵션을 선택합니다.

참조: 이 옵션이WGS-84이면, 표시되는 좌표 필드들은 [프로젝트 등록 정보] 대화 상자의 [단위와 포맷]탭에서 선택한 WGS-84표시 형식에 따라 결정됩니다. 예를 들어, [WGS-84표시 형식] 필드가 L,L,H로 설정되어 있으면, 요약 페이지의 좌표 필드들은 위도,경도,타원체고로 표시됩니다. [WGS-84표시 형식]이 X,Y,Z이면, WGS-84선택시 그 필드들은 X, Y, Z로 표시됩니다.

질 선택기 제어

좌표 구성 요소에 질 등급을 지정하기 위해 사용됩니다. 등급은 다음과 같이 내림차순으로 나열됩니다.

  기준 등급

  측량 등급

  매핑 등급

 미지 등급

상태

선택한 포인트의 상태를 표시합니다. 이 상태는 재계산이나 측량계산을 할 때 고려됩니다. 이 필드를 수정하려면, 화살표를 클릭하고 포인트에 적용하고자 하는 옵션을 드롭다운목록에서 선택하면 됩니다.

포인트의 위치 도출에 이 좌표를 사용하지 않으려면 이를 '불이용' 상태로 설정합니다.

포인트의 위치 도출에 사용할 수 있는 좌표나 관측치가 없는 경우에만 이 좌표를 쓰고자 하면 '점검점으로 이용' 상태로 합니다.

재계산 보고서는 '불이용' 상태의 좌표는 제외하고 '점검점으로 이용'  좌표에 대해서만 보고서를 작성해 줍니다.

좌표형

좌표는 사용자가 선택하는 좌표형으로 데이터베이스에 저장됩니다.  해당 좌표를 다른 좌표형으로 저장하면, 동일한 좌표형을 가진 기존의 좌표는 덮여 쓰이게 됩니다.


등록 정보 창 - [측량] 탭 - GPS 관측치
 등록 정보 창 − [측량] 탭 − GPS 관측치

RTK, Static, FastStatic 과 후처리 Kinematic벡터들과 같은 모든GPS 관측치 종류에 관한 정보를 볼 수 있습니다.

등록 정보 창에 [측량] 탭을 이용하면 선택한 GPS 관측치의 측량 관련 정보를 보거나 편집할 수 있습니다. 측량 정보는 페이지 형식으로 정리되어 있습니다.

해당 메뉴 단추를 클릭함으로써 다음과 같은 페이지들을 볼 수 있습니다.

요약
경고
베이스 선점
로버 선점
관측치
관측치 통계


등록 정보 창 - [측량] 탭 - 요약 페이지 (GPS관측치)
 등록 정보 창 − [측량] 탭 − 요약 페이지 (GPS관측치)

이 페이지는 등록 정보 창에서 선택한GPS관측치의 관측 내역을 요약해 줍니다.

1.	측량 보기 화면 상태에서GPS관측치 하나를 선택합니다.

2.	이 페이지를 보기 위해서는, 등록 정보 창에서 요약 메뉴 단추 [image] 를 클릭합니다.

시점

관측 기점이 되는 기준점의 이름을 표시합니다.

종점

관측치 로버점의 이름을 표시합니다.

시간

관측 지속 시간과 관측 시작 시각을 표시합니다.

참조: 데이터를 외부로부터 가져오는 경우, 시작 및 종료 시간은 GPS시간에서 UTC(협정 세계시 - 실제로는 그리니치 표준시)로 변환되고, 다시 Microsoft Windows에 설정된 현재의 표준시로 표시됩니다.

팁: 포인터를 이 필드 위에 두면 관측 종료 시간의 도구팁이 나옵니다.

처리기 형

선택한 관측치의 처리기 유형을 표시합니다. 유형은 관측해를 결정하는데 사용된 처리기와 관련이 있습니다. 처리기 형 필드는 다음과 같은 내용을 가질 수 있습니다.

  RTK

  Static 또는 FastStatic

  PPKinematic

  미처리:  ' 미처리'는 기선 처리기에 의해 관측해가 결정될 수 있지만 그렇게 되지 않은 경우를 표시합니다.

측량 방식

관측치를 구하는데 사용된 GPS측량 방법을 표시합니다.

  Topo

  연속

  관측된 기준점

  Rapid

  Static 또는 FastStatic

  이벤트

  Stop and Go

상태

선택한 관측치의 상태를 표시합니다. 이 상태는 재계산이나 측량계산을 할 때 고려됩니다. 이 필드를 이용하여 불량 관측치(관측치가 폐합 오차를 내는 경우)를 '불이용' 상태로 설정합니다.

이 필드를 수정하려면, 화살표를 클릭하고 포인트에 적용하고자 하는 옵션을 드롭다운목록에서 선택하면 됩니다.

포인트의 위치 도출에 이 관측치를 사용하지 않으려면 이를 '불이용' 상태로 설정합니다.

포인트의 위치 도출에 사용할 수 있는 좌표나 관측치가 없는 경우에만 이 관측치를 쓰고자 하면 '점검점으로 이용' 상태로 합니다.

재계산 보고서는 '불이용' 상태의 좌표는 제외하고 '점검점으로 이용'  좌표에 대해서만 보고서를 작성해 줍니다.

망조정에 이용

선택한 관측치가  망조정( 망조정모듈이 설치된 경우)에 사용되지 않고,  [재계산]에 의해 데이터베이스가 계산되어질 때만 사용되기를 원하면 이 확인란을 선택하지 마십시요.

관측치가 공분산 정보나 표준 오차 정보를 가지지 않는 경우에는 이 옵션은 불이용 상태가 됩니다.

관측치가 불이용 상태이면, 이 옵션을 사용할 수 없습니다.


 등록 정보 창 - [측량] 탭 - 관측치 페이지 (GPS관측치)

활성해를 선택하고 선택한 관측치에 대한 기선 구성 요소를 보기 위해 이 페이지를 이용합니다.

1.  측량 보기 화면에서 기선을 선택합니다.

2.  이 페이지를 보기 위해서는, 등록 정보 창을 열고 [관측치] 메뉴 단추 [image] 를 클릭합니다

활성해

활성 기선해를 표시합니다. 다른 처리스타일을 사용해 기선을 두 번 이상 (기선처리모듈이 설치돤 경우) 처리하고  GPS처리 대화 상자에서 중복 기선해들을 덮어쓰지 않기로 한 경우, 기선은 두개 이상의 해를 가질 수 있습니다. 그러나 기선은 단 하나의 활성해만 가질 수 있습니다. 이 활성해가 재계산 및 망조정에서 사용됩니다.  화살표를 클릭하고 관측치를 위해 활성시키기 원하는 최적해를 드롭다운 목록으로부터 선택합니다.

팁: 해(solution) 위에 포인터를 위치시키면 기선 결과에 대한 도구팁이 나옵니다.

해 유형

선택한 관측치의 관측 해 유형을 표시합니다.

델타X, 델타Y, 델타Z

표시 옵션이 XYZ로 설정되었을 때 GPS기선의 델타 값을WGS-84 Cartesian 좌표 시스템으로 표시합니다.

법선면 전방 방위각, 타원체 거리, 델타고

표시 옵션이 측지로 설정되었을 때 GPS기선 구성 요소를 로컬 타원체로 표시합니다.

참조: 법선면 전방 방위각은 기준점으로부터 로버점 (roving point) 방향으로 법선면 전방 (측지) 방위각을 표시합니다.

델타N, 델타E, 델타U

표시 옵션이 NEU로 설정되었을 때 로컬 측지 수평선 위의 델타 X 좌표, Y 좌표 및 타원체고 값들을 표시합니다.

지상 대 지상의 내역 표시

이 확인란을 선택하면 기선 구성 요소의 값들이 기준점 및 로버점에서 수신기가 선점한 마크의 지상 타원체고로 축소 변환되어 표시됩니다.

이 확인란을 선택하지 않으면, 기선 구성 요소 값들은 기준 안테나 페이즈 센터로부터 로버 안테나 페이즈 센터까지를 보여줍니다. 다음 그림은 그 차이를 보여줍니다.


등록 정보 창 - [측량] 탭 - 관측치 페이지 (위치해)

관측치 페이지를 써서 활성해를 선택하고, 선택한 관측치의 기선 구성요소를 봅니다.

1.	측량 보기 화면에서 기선을 선택합니다.

2.	이 페이지를 보려면 등록 정보 창에서 [관측치] 메뉴 단추 [image] 를 클릭합니다.

처리기 형

처리 방식(예: WAAS, wide-area RTK)을 표시합니다.

측량 방식

사용된 측량 방식(예: 연속)을 표시합니다.

해 유형

선택한 관측치의 관측 해 유형(예: L1 유동)을 표시합니다.


등록 정보 창 - [측량] 탭 - [관측치 통계] 페이지 (GPS관측치)
등록 정보 창 − [측량] 탭 − 관측치 통계 페이지 (GPS관측치)

이 페이지는 기선 관측치 종류에 따른 해당 해(solution) 통계와 등급 표시를 나타냅니다.  RTK관측치에 대한 통계는 Static/후처리 관측치에 대한 통계와 다릅니다.

해의 질을 확인하기 위해  이 페이지를 이용합니다.

1.	측량 보기 화면에서 기선을 선택합니다.

2.	이 페이지를 보려면 등록 정보 창에서 [관측치 통계] 메뉴 단추 [image] 를 클릭합니다.

RTK관측치를 보고 있으면, 관측치 통계 페이지에 다음 필드들이 표시됩니다.:

측정치 갯수

관측을 완료하기 위해 사용된 측정치 (에포크)의 갯수를 표시합니다.

최소 위성수

관측 중 기지 수신기와 로버 수신기에 의해 추적된 위성의 최소 숫자를 표시합니다.

RMS

제곱 평균 제곱근 (Root Mean Square)을 표시합니다. 이RMS값은 기선해를 정하기 위해 사용된 측정치의 정확도를 표시합니다.

사거리

관측치의 경사거리를 표시합니다.

수평 정밀도

관측 해를 구하기 위해 사용된 관측치들의 수평 정밀도를 표시합니다.

수직 정밀도

관측 해를 구하기 위해 사용된 관측치들의 수직 정밀도를 표시합니다.

PDOP/RDOP

Kinematic 기선에 대한  Position Dilution of Precision (PDOP) 값이나 Static 기선에 대한 Relative Dilution of Precision (RDOP) 값을 표시합니다. RDOP는 시간이 경과함에 따라 감소합니다.

후처리 기선을 보고 있으면 다음과 같은 필드들이 관측치 통계 페이지에 표시됩니다.

비율

측정치에 최적인 두 분산(처리기의 정수 검색을 통해 도출)의 비율을 표시합니다.

기준 분산

기준 분산을 표시합니다. 기준분산은 기선에 대한 관측 데이터가 계산된 해에 얼마나 잘 맞는지를 알려주는 지표입니다.

RMS

제곱 평균 제곱근을 표시합니다. RMS값은 기선해를 정하기 위해 사용된 측정치의 정확도를 표시합니다.

사거리

관측치의 경사거리를 표시합니다.

수평 정밀도

관측 해를 구하기 위해 사용된 관측치들의 수평 정밀도를 표시합니다.

수직 정밀도

관측 해를 구하기 위해 사용된 관측치들의 수직 정밀도를 표시합니다.

RDOP

Relative Dilution of Precision 값을 표시합니다.


등록 정보 창 - [측량] 탭 - 관측치 통계 페이지 (위치해)
등록 정보 창 − [측량] 탭 − 관측치 통계 페이지 (위치해)

이 페이지는 해당 해(solution) 통계와 등급 표시기 유형을 나타냅니다.

해의 질을 확인하기 위해  이 페이지를 이용합니다.

1.	측량 보기 화면에서 기선을 선택합니다.

2.	이 페이지를 보려면 등록 정보 창에서 [관측치 통계] 메뉴 단추 [image] 를 클릭합니다.

수평 정밀도

위치해를 결정하기 위해 사용된 측정치들의 수평 정밀도를 표시합니다.

수직 정밀도

위치해를 결정하기 위해 사용된 측정치들의 수직 정밀도를 표시합니다.

RMS

제곱 평균 제곱근(RMS)을 표시합니다. RMS값은 기선해를 정하기 위해 사용된 측정치의 정확도를 표시합니다.

PDOP

기선에 대한  Position Dilution of Precision (PDOP) 값을 표시합니다.

최소 위성수

관측 중 추적된 위성의 최소 숫자를 표시합니다.

GPS 위치 갯수

해에 쓰인 GPS 위치의 개수를 표시합니다.


등록 정보 창 - [측량] 탭 - 광파 관측치
 등록 정보 창 − [측량] 탭 − 광파 관측치

데오도라이트나 토탈 스테이션과 같은 광파기를 이용하여 필드에서 측정한 비 GPS관측치에 관한 정보를 볼 수 있습니다.

선택한 광파 관측치의 측량 관련정보를 보거나 설정내역을 편집하려면 등록 정보 창의 [측량] 탭을 사용합니다. 측량 정보는 페이지 형식으로 정리되어 있습니다.

해당 메뉴 단추를 클릭하면 다음과 같은 페이지들을 볼 수 있습니다.

요약
타겟 설정
관측치
관측치 통계
참조: 광파 관측치는 나무계층구조에서 다음과 같은 순서로 표시됩니다: 후시점 이름, 기계점 이름, 및 전시점 이름


등록 정보 창 - [측량] 탭 - 요약 페이지(광파 관측치)
 등록 정보 창 − [측량] 탭 − 요약 페이지(광파 관측치)

요약 페이지는  등록 정보 창에서  선택한 광파 관측치의 관측내역을 요약해 보여줍니다.

1.  측량 보기 화면에서 광파 관측치를 선택합니다

2.  이 페이지를 보려면, 등록 정보 창에서 [요약] 메뉴 단추 [image] 를 클릭합니다.

기계점

측량기 설정이 이루어진 관측 기점의 이름을 표시합니다.

기계고

측량기의 높이를 표시합니다.

후시점

후시로 사용된 포인트의 이름을 표시합니다.

전시점

관측 대상점이 되는 타겟점의 이름을 표시합니다.

상태

선택한 관측치의 상태를 표시합니다. 이 상태는 재계산이나 측량계산을 할 때 고려됩니다.

이 필드를 수정하려면, 화살표를 클릭하고 포인트에 적용하고자 하는 옵션을 드롭다운목록에서 선택하면 됩니다.

포인트의 위치 도출에 관측치를 사용하지 않으려면 이를 '불이용' 상태로 설정합니다.

관측치가 후시점에 대한 점검인 경우에는 관측치를 '점검점으로 이용' 상태로 합니다. 이렇게 함으로써 폐합은 보고되지만 관측치는 좌표를 정하는  데 사용되지 않도록 합니다.

재계산 보고서는 '불이용' 상태의 좌표는 제외하고 '점검점으로 이용'  좌표에 대해서만 보고서를 작성해 줍니다

망조정에 이용

선택한 관측치가  망조정 ( 망조정 모듈이 설치된 경우)에 사용되지 않고 재계산에  사용되기를 원하면 이 확인란을 선택하지 않습니다.


등록 정보 창 - [측량] 탭 - 관측치 페이지 (광파 관측치)
 등록 정보 창 − [측량] 탭 − 관측치 페이지 (광파 관측치)

이 페이지를 이용하면 선택한 관측치에 대한 측량기 설정과 타겟 설정 사이의 관측치 구성 요소를 볼 수 있습니다.

1.	측량 보기 화면에서 관측치를 선택합니다.

2.	이 페이지를 보려면 등록 정보 창에서 [관측치] 메뉴 단추 [image] 를 클릭합니다.

후시 방위각

기계점과 후시점 사이에 계산 방위각과 등급을 보여줍니다.

참조: 후시점이 좌표를 갖는 경우에는 이 좌표들이 후시점으로의 방위각을 구하기 위해 사용됩니다. 키입력 방위각이 있는 경우에는 키입력 방위각의 등급과 후시점 좌표를 사용하여 계산 방위각과 비교되며, 가장 높은 등급을 가진 방위각이 사용됩니다. 계산 방위각과 키입력 방위각의 등급이 동일한 경우에는 계산 방위각이 사용됩니다.

수평각,  수직각, 사거리

표시 옵션이 HA,VA,SD로 설정되었을 때 관측 구성 요소의 관측 값들이 표시됩니다.

방위각, 수평거리, 델타표고

표시 옵션이 AZ,HD,VD일 때, 그리드 좌표계로 축소 변환된 관측 구성 요소의 값들이 표시됩니다.

참조: 데이터를 외부로부터 가져올 경우, 대기 보정과 곡률 및 굴절 보정이 관측치에 적용됩니다. 수평 관측치는 후시점으로부터의 각으로 축소 변환됩니다. 수직각은 곡률 및 굴절을 위해 보정됩니다.  PPM보정은 사거리에 적용됩니다.

관측치 종류

정위와 반위 관측치의 평균을 구했거나 관측치가 구해졌을 때 사용된 측량기의 정, 반위를 표시합니다. 평균 관측치는 동일 설정에서 후시점과 관측점 사이에서 관측된 하나의 정위/반위 쌍의 평균입니다.

관측치는 또한 Trimble Survey Controlle에서 구한 평균 회전각으로부터 도출될 수 있습니다. (예를 들어, 라운드 관측된 경우)

지상 대 지상의 내역 표시

이 확인란을 선택하면 관측치가 기계점과 전시점에 의해 선점된 마크들의 지상 타원체고로 축소 변환되어 나타납니다.


등록 정보 창 - [측량] 탭 - 레벨 관측치
 등록 정보 창 − [측량] 탭 − 레벨 관측치

현장에서 측정된 모든 레벨 관측치들에 대한 정보를 볼 수 있습니다. 선택한 레벨 관측치에 대한 측량 관련 정보를 보려면, 등록 정보 창 의 측량 탭을 사용합니다.

측량 탭의 정보는 페이지 형식으로 정리되어 있습니다. 이 페이지를 보려면, 아래와 같은 해당 메뉴 단추를 클릭합니다.

요약
관측치 통계.
참조: 레벨 관측치 데이터를 이용하여 망 조정을 수행하려면, 레벨 관측치를 위한 표준 오차들을 정의해야 합니다. 표준 오차들은 다음과 같은 경우에 계산됩니다:

  디지털 레벨 데이터를 외부로부터 가져오는 경우에는 턴(turn) 수와,  [조정 스타일 편집] 대화 상자 (비 GPS 제어 탭)에서 표척을 독취할 때 발생한 독취 오차를 이용하여 표준 오차를 계산합니다.

  Trimble Data Exchange포맷에 있는 레벨 데이터의 [가져오기] 작업을 수행할 때. Trimble Data Exchange포맷에 턴 수를 포함시키면, 델타 표고 표준 오차가 턴 수에 근거해서 계산됩니다. Trimble Data Exchange포맷에 델타 표고 표준 오차 값을 포함시키면, 이 값이 사용됩니다.

표준 오차가 정의되지 않거나 계산되지 않으면, 레벨 관측치는 조정에 사용 할 수 없습니다.

등록 정보 창 에서 각 관측치에 대한 표준 오차를 입력할 수 있습니다.


등록 정보 창 - 측량 탭 -요약 페이지 (레벨 관측치)
 등록 정보 창 − 측량 탭 − 요약 페이지 (레벨 관측치)

등록 정보 창의 요약 페이지는 선택한 레벨 관측치의 관측내역을 요약해 줍니다.

1.	레벨 관측치를 선택합니다.

2.	이 페이지를 보려면, 등록 정보 창에서 [요약] 메뉴 단추 [image] 를 클릭합니다.

시점

레벨런이 시작되는 점의 이름을 표시합니다.

종점

레벨런이 끝나는 포인트의 이름을 표시합니다.

델타표고

시점과 종점 사이에  표고차를 보여줍니다.

상태

목록으로부터 관측치에 적용하고 싶은 상태를 선택합니다. 이 상태는 재계산이나 측량계산을 할 때 고려됩니다.

관측치가 어떤 포인트에 대한 점검인 경우,  그 관측치를 '점검점으로 이용' 상태로 합니다. 이는 폐합에 대해서는 보고를 하나 해당 관측치는 표고를 정하는데 사용하지 않기 위한 것입니다. 관측치를 포인트의 위치 결정에 사용하지 않으려면 이를 ' 불이용' 상태로 합니다.

재계산 보고서는 '점검점으로 이용' 상태의 레벨 관측치에 대해서는 보고서를 작성하나, '불이용' 상태의 관측치에 대해서는 보고서를 작성하지 않습니다.


등록 정보 창 - [측량] 탭 - 관측치 통계 페이지(레벨 관측치)
 등록 정보 창 − [측량] 탭 − 관측치 통계 페이지(레벨 관측치)

이 페이지는 적절한 통계와 등급 지표를 보여줍니다.

이 페이지를 보려면, 등록 정보 창 에서:

 [측량] 탭에서 [관측치 통계] 메뉴 단추 [image] 를 클릭합니다.

표준 오차 (델타표고)

이 값은 델타표고 표준 오차를 표시합니다. 다음과 같은 경우에 오차가 계산됩니다:

  디지털 레벨파일을  외부로부터 가져오는 경우. (턴 수와 레벨 막대 독취 오차에 근거하여 델타 표고 표준 오차가 계산됩니다.)

  Trimble Data Exchange포맷으로 레벨 데이터를 외부로부터 가져오는 경우. Trimble Data Exchange포맷에 턴 수를 포함시키면, 델타 표고 표준 오차는 턴 수에 근거해서 계산됩니다. Trimble Data Exchange포맷에 델타 표고 표준 오차 값을 포함시키면, 이 값이 사용됩니다.

임의의 표준 오차 값을 입력할 수도 있습니다.

턴 수

이는 두 포인트사이의 델타표고를 정하기 위해 측량기 설정을 한 횟수입니다.

선의 길이

레벨 루프의 길이를 표시합니다. 이는 후시와 전시 거리를 더하여 계산합니다.


등록 정보 창 - [측량] 탭 - 레이저 거리계 관측치
 등록 정보 창 − [측량] 탭 − 레이저 거리계 관측치

현장에서 레이저 거리계로 측정한 비 GPS관측치에 대한 완벽한 정보를 볼 수 있습니다.

선택한 레이저 거리계 관측치의 측량 관련 정보를 보거나 편집하려면 등록 정보 창의 [측량] 탭을 사용합니다. 측량 정보는 페이지 형식으로 정리되어 있습니다.

해당 메뉴 단추를 클릭하면 다음과 같은 페이지를  볼 수 있습니다:

요약
관측치


등록 정보 창 - [측량] 탭 - 요약 페이지 (레이저 거리계 관측치)
등록 정보 창 − [측량] 탭 − 요약 페이지 (레이저 거리계 관측치)

이 페이지는 등록 정보 창에서 선택한 레이저 거리계 관측치의 내역을 요약합니다.

이 페이지를 보려면, 등록 정보 창을 열고,

 [측량] 탭에서 [요약] 메뉴 단추 [image] 를 클릭합니다.

기계점

레이저 거리계 관측이 시작된 포인트를 표시합니다.

기계고

거리계의 높이를 표시합니다.

타겟점

레이저 거리계 관측 대상점을 표시합니다.

타겟 높이

타겟의 높이를 표시합니다.

상태

선택한 관측치의 상태를 표시합니다. 이 상태는 재계산이나 측량계산을 할 때 고려됩니다. 이 필드를 수정하려면, 화살표를 클릭하고 포인트에 적용하고자 하는 옵션을 드롭다운목록에서 선택하면 됩니다.

포인트의 위치 도출에 관측치를 사용하지 않으려면 이를 '불이용' 상태로 설정합니다.

포인트의 위치 도출에 사용할 수 있는 좌표나 관측치가 없는 경우에만 이 관측치를 쓰고자 하면 '점검점으로 이용' 상태로 합니다.

재계산 보고서는 '불이용' 상태의 좌표는 제외하고 '점검점으로 이용'  좌표에 대해서만 보고서를 작성해 줍니다


등록 정보 창 - [측량] 탭 - 관측 페이지 (레이저 거리계 관측치)
등록 정보 창 − [측량] 탭 − 관측 페이지 (레이저 거리계 관측치)

이 페이지를 이용하면 관측치 구성 요소를 보거나, 선택한 관측치에 사용된 측량기와 타겟 설정 사이의 자기 편각을 편집할 수 있습니다.

이 페이지를 보려면, 등록 정보 창을 열고:

 [측량] 탭에서 [관측치] 메뉴 단추 [image] 를 클릭합니다..

자기 방위각

관측치의 관측 자기 방위각을 표시합니다.

편각

자북과 진북사이의 자기 편각을 표시합니다. 실제 방위각을 계산하려면 이 값이 필요합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

수직각

관측치가 구해 질 때 측정된 수직각을 표시합니다. 이 값이 공백값이면, 거리는 수평으로 간주됩니다.

사거리

관측치의 사거리를 표시합니다.


등록 정보 창 - [비고] 탭
등록 정보 창 − [비고] 탭

 개요

비고 레코드는 데이터베이스 내의 비 그래픽 개체들입니다. 즉, 그래픽 창에 나타나지 않고 그래픽 창에서 선택할 수도 없습니다.

[비고] 탭은Trimble Survey Controller로부터 사용자입력 비고들을 포함한 작업을 가져오는 경우에  비고 레코드를 보거나 편집하는데 사용됩니다.

[비고] 탭을 사용하려면,

1.	다음 중 한가지를 실행합니다.

 [선택 / 선택 집합]을 선택합니다. 보고자 하는 비고를 포함한 .dc 화일을 고릅니다.

 [선택 / 질의기준 / 비고]를 선택합니다.

2.	등록 정보 창을 엽니다.

모든 비고들이 등록 정보 창에 연필 아이콘 [image] 과 함께 표시됩니다.


등록 정보 창 - CAD 탭 (포인트)
등록 정보 창 − [CAD] 탭  (포인트)

등록 정보 창에 [CAD] 탭 을 사용하면 선택한 포인트의 CAD 관련 정보를 보거나 편집할 수 있습니다.

레이어

선택한 포인트가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

포인트 스타일

목록에서 포인트 스타일을 보거나 선택합니다.

피쳐 코드

선택한 포인트의 피쳐 코드 값을 보거나 입력합니다.

설명

선택한 포인트의 설명을 보거나 입력합니다.


등록 정보 창 - [선] 탭
등록 정보 창 − [선] 탭

선택한 선 개체의 필드들을 보거나 편집하기 위해서 [선] 탭을 사용합니다.

이 탭을 이용 하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  선 개체를 더블 클릭합니다.

  그래픽 창에서 선 개체를 선택하고 등록 정보 창 엽니다.

시점

선택한 선의 시작점 이름을 표시합니다. 시작점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

종점

선택한 선의 종점 이름을 표시합니다. 종점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

방위각

시작점과 종점간의 방위각을 표시합니다.

거리

시작점과 종점간의 거리를 표시합니다.

레이어

선택한 선 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

선 스타일

선택한 선의 스타일을 표시합니다. 이 필드를 변경하려면 목록에서 선 스타일을 선택합니다.


등록 정보 창 - [곡선] 탭
등록 정보 창 − [곡선] 탭

[곡선] 탭은 선택한 곡선 개체의 필드들을 보거나 편집하기 위해 사용됩니다.

이 탭을 이용 하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  곡선 개체를 더블 클릭합니다.

  그래픽 창에서 곡선 개체를 선택하고 등록 정보창을 엽니다.

시점

선택한 곡선의 시작점 이름을 표시합니다. 시작점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

종점

선택한 곡선의 종점 이름을 표시합니다. 종점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

진입 접선, 퇴출 접선

선택한 곡선의 접선들을 표시합니다. 이 필드들을 변경하려면, 키보드로 새 값을 입력합니다.

곡선 너비

선택한 곡선의 폭이 얼마나 되는지를 표시합니다. 이 필드를 변경하려면, 0 와 1 사이에 값을 입력합니다.

레이어

선택한 곡선 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

선 스타일

선택한 곡선의 선 스타일을 표시합니다. 이 필드를 변경하려면 목록에서 선 스타일을 선택합니다.


등록 정보 창 - [호] 탭
등록 정보 창 − [호] 탭

[호] 탭은 선택한 호 개체의 필드들을 보거나 편집하기 위해 사용됩니다.

이 탭을 이용 하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  호 개체를 더블 클릭합니다.

  그래픽 창에서 호 개체를 선택하고 등록 정보 창 을 엽니다.

시점

선택한 호의 시작점 이름을 표시합니다. 시작점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

종점

선택한 호의 종점 이름을 표시합니다. 종점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

중심

선택한 호의 중심점 이름을 표시합니다. 중심점 이름을 변경하려면, 키보드로 새 값을 입력합니다.

X 좌표, Y 좌표

호의 중심점 좌표들을 표시합니다. 이 필드 값을 변경하려면, 키보드로 새 값을 입력합니다.

참조: 호에 대한 중심점이 정의 되었으면, 좌표들은 사용되지 않습니다. 중심점이 사용됩니다.

레이어

선택한 호 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

선 스타일

선택한 호의 선 스타일을 표시합니다. 이 필드를 변경하려면 목록에서 선 스타일을 선택합니다.

180도 미만의 호

이 확인란은 기본값으로 선택됩니다. 선택한 호의 각이 180도 보다 큰 경우를 적용하려면 확인란을 선택하지 마십시요.


등록 정보 창 - [포인트 주석] 탭
등록 정보 창 − [포인트 주석] 탭

[포인트 주석] 탭은 어떤 포인트에 추가된 주석 개체의 필드를 보거나 편집하기 위해 사용됩니다.

이 탭을 이용 하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  주석 개체를 더블 클릭합니다.

  그래픽 창에서 주석 개체를 선택하고 등록 정보 창 을 엽니다.

포인트

선택한 주석 개체가 속한 포인트의 이름을 표시합니다.

텍스트 표현문

선택한 주석 개체의 텍스트 표현문을 표시합니다. 텍스트 표현은 주석 템플리트에 삽입된 필드코드이거나 텍스트 정의일 수 있습니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

X 좌표, Y 좌표

선택한 주석 개체의 기본 �하단선 왼쪽� 앵커 위치와 관련된 좌표들을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

배향

주석 개체에 대한 배향을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

레이어

선택한 주석 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

텍스트 스타일

선택한 주석 개체의 텍스트 스타일을 표시합니다. 이 필드를 변경하려면 목록에서  새 텍스트 스타일을 선택합니다.


등록 정보 창 - [선 주석] 탭
등록 정보 창 − [선 주석] 탭

[선 주석] 탭은 선 개체 주석을 선택하여  이 주석 개체의 필드를 보거나 편집하기 위해 사용됩니다.

이 탭을 이용하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  주석 개체를 더블 클릭합니다.

  그래픽 창에서 주석 개체를 선택하고 등록 정보 창 을 엽니다.

선

선택한 주석 개체가 속한 선을 정의하기 위해 사용된 포인트들의 이름을 표시합니다.

텍스트 표현문

선택한 주석 개체의 텍스트 표현문을 표시합니다. 텍스트 표현은 주석 템플리트에 삽입된 필드 코드이거나 텍스트 정의 일 수 있습니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

X 좌표, Y 좌표

선택한 주석 개체의 기본 �하단선 왼쪽� 앵커 위치와 관련된 좌표들을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

배향

주석 개체에 대한 배향을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

레이어

선택한 주석 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

텍스트 스타일

선택한 주석 개체의 텍스트 스타일을 표시합니다. 이 필드를 변경하려면 목록에서  새 텍스트 스타일을 선택합니다.


등록 정보 창 - [호 주석] 탭
등록 정보 창 − [호 주석] 탭

[호 주석] 탭은 호 개체 주석을 선택하여  이 주석 개체의 필드를 보거나 편집하기 위해 사용됩니다.

이 탭을 이용 하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  주석 개체를 더블 클릭합니다.

  그래픽 창에서 주석 개체를 선택하고 등록 정보 창 을 엽니다.

호

선택한 주석 개체가 속한 호를 정의하기 위해 사용된 포인트들의 이름을 표시합니다.

텍스트 표현문

선택한 주석 개체의 텍스트 표현문을 표시합니다. 텍스트 표현은 주석 템플리트에 삽입된 필드코드이거나 텍스트 정의 일 수 있습니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

X 좌표, Y 좌표

선택한 주석 개체의 기본 �하단선 왼쪽� 앵커 위치와 관련된 좌표들을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

배향

주석 개체에 대한 배향을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

레이어

선택한 주석 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

텍스트 스타일

선택한 주석 개체의 텍스트 스타일을 표시합니다. 이 필드를 변경하려면 목록에서 새 텍스트 스타일을 선택합니다.


등록 정보 창 - [텍스트] 탭
등록 정보 창 − [텍스트] 탭

[텍스트] 탭은 선택한 텍스트 개체의 필드들을 보거나 편집하기 위해 사용됩니다.

이 탭을 이용 하려면, 평면도 보기 화면에서 다음 중 하나를 실행합니다:

  텍스트 개체를 더블 클릭합니다.

  그래픽 창에서 텍스트 개체를 선택하고 등록 정보 창 을 엽니다.

텍스트 표현문

선택한 텍스트 개체의 텍스트 표현문을 표시합니다. 텍스트 표현은 필드코드이거나 텍스트 정의일 수 있습니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

Y 좌표, X 좌표

선택한 텍스트 개체에 속한 특정 앵커 형과 관련된  좌표들을 표시합니다. 이 필드들을 변경하려면 키보드로 새 값을 입력합니다.

배향

텍스트 개체에 대한 배향을 표시합니다. 이 필드를 변경하려면 키보드로 새 값을 입력합니다.

레이어

선택한 텍스트 개체가 속한 레이어를 표시합니다. 이 필드를 변경하려면, 목록에서 레이어를 선택하거나 키보드로 새 레이어 이름을 입력합니다.

텍스트 스타일

선택한 텍스트 개체의 텍스트 스타일을 표시합니다. 이 필드를 변경하려면 목록에서  새 텍스트 스타일을 선택합니다.


등록 정보 창 - [속성] 탭
등록 정보 창 − [속성] 탭

등록 정보 창 의 [속성] 탭은 사용자의 프로젝트의 속성을 관리하는데 사용됩니다. 사용자는 등록 정보 창을 이용하여 Trimble Geomatics Office에 있는 속성에 대한 보기, 편집, 추가, 삭제 등의 작업을 할 수 있습니다.

등록 정보 창에서 이 탭을 이용 하려면:

 [속성] 탭을 선택합니다.

참조: 사용자가 속성 이용을 위한 프로젝트 구성을 한 후에 [속성] 탭을 사용할 수 있습니다.

속성 선택 도구

속성 선택 도구는 해당 포인트에 선택된 현재 속성을 표시합니다. 포인트의 연관 속성이 1개를 초과하는 경우에는 화살표를 클릭하여 원하는 속성을 드롭다운 목록으로부터 선택합니다.

속성 이름

선택한 포인트와 연관되어 있는 선택한 속성 등록 정보의 이름을 표시합니다.

값

선택한 포인트와 연관되어 있는 선택한 속성 등록 정보의 값을 표시합니다. 속성 값을 편집하려면, 해당 필드를 클릭하고 목록에서 값을 선택합니다. 메뉴목록이 없는 경우에는 키보드로 새 값을 필드에 입력합니다.


등록 정보 창 - [일반] 탭
등록 정보 창 − [일반] 탭

등록 정보 창의 [일반] 탭은 사용자가 어떤 개체도 선택하지 않고 등록 정보 창을 열었거나 1개를 초과하는 개체가 등록 정보 창 선택 목록에 하이라이트된 경우에 표시됩니다.

[일반] 탭에는 �등록 정보 없음" 이라는 메시지가 표시됩니다.

어떤 개체의 등록 정보를 보려면, 그래픽 창이나 등록 정보 창의 선택 목록에서 그 개체를 선택하면 됩니다.


등록 정보 창 - [측량] 탭 - 축소 변환 관측치
등록 정보 창 − [측량] 탭 − 축소 변환 관측치

사용자는Trimble Survey Controller를 이용하여, 현장에서 측정한 축소 변환된 비 GPS 관측치(예, 옵셋)에 관한 완벽한 정보를 볼 수 있습니다.

선택한 관측치에 관한 측량 관련 정보를 보거나 편집하려면 등록 정보 창의 [측량] 탭을 사용합니다. 측량 정보는 페이지 형식으로 정리되어 있습니다.

[측량] 탭에서 이 페이지를 보려면, 해당 메뉴 단추를 클릭합니다. 다음과 같은 페이지들을 볼 수 있습니다:

개요
관측치


등록 정보 창 - [측량] 탭 - 요약 페이지 (축소 변환 관측치)
등록 정보 창 − [측량] 탭 − 요약 페이지 (축소 변환 관측치)

요약 페이지는 등록 정보 창에서 선택한 축소 변환 관측치의 내역을 요약합니다.

이 페이지를 보려면, 등록 정보 창 에서:

 [측량] 탭을 선택하고 [요약] 메뉴 단추 [image] 를 클릭합니다.

시점

측정이 시작된 포인트의 이름을 표시합니다.

종점

측정 대상 포인트의 이름을 표시합니다.

상태

선택한 옵셋 관측치의 상태를 표시합니다. 관측치의 상태는 재계산, 또는 측량계산이 수행될 때 고려됩니다. 이 필드를 수정하려면, 화살표를 클릭하고 드롭다운 목록에서 관측에 적용하기를 원하는 옵션을 선택합니다.


등록 정보 창 - [측량] 탭 - 관측치 페이지 (축소 변환 관측치)
등록 정보 창 − [측량] 탭 − 관측치 페이지 (축소 변환 관측치)

이 페이지에서 축소 변환 관측치의 관측치 구성 요소를 봅니다.

이 페이지를 보려면, 등록 정보 창 에서

 [측량] 탭을 선택하고 [관측치] 메뉴 단추 [image] 를 클릭합니다.

방위각

관측치의 관측 방위각을 표시합니다.

수평 거리

관측치의 측정 수평 거리를 표시합니다.

수직 거리

관측치의 측정 수직 거리를 표시합니다.


좌표 - 개요
좌표 − 개요

추가 정보

 기타

사용자가 어떤 포인트에 대해 알려진 좌표들을 Trimble Geomatics Office 프로젝트에 입력하면 좌표는 해당 포인트에 대한 다른 측량 정보들과 함께 저장됩니다. 각 포인트는 최대 하나의 사용자 입력WGS-84 좌표와 하나의 사용자 입력 그리드(로컬) 좌표를 가질 수 있습니다.

기존 사용자 입력 좌표를 편집하면 구 좌표는 새 것으로 바뀝니다.

아래와 같은 방법을 사용하여 기존 포인트에 대한 좌표를 입력할 수 있습니다.

  등록 정보 창 / [새 좌표 추가] 단추

 [포인트] 대화 상자 (망 조정 모듈이 설치된 경우)

  데이타베이스에 이미 존재하는 포인트에 대한 좌표를  가진 외부 파일을 가져오기

다음과 같은 방법으로 키입력 좌표를 갖는 새 포인트에 대한 좌표를 입력할 수 있습니다.

 [포인트 삽입] 대화 상자

  데이터베이스에 없는 포인트에 대한 좌표를 가진 외부 파일을 가져오기

Trimble Geomatics Office에 입력되는 모든 좌표는 포인트에 대한 기본 좌표로 추가되며, 등록 정보 창의 개별 좌표 페이지 에서 볼 수 있습니다.

참조: 포인트의 위치를 보려면 요약 페이지 를 사용합니다.를 이용합니다. 입력된 좌표는 그 등급 질이 관측치와 같거나 높다면 포인트의 위치 결정에 쓰입니다.


등록 정보 창 - [측설] 탭 -개요
등록 정보 창 − [측설] 탭 − 개요

[측설] 탭은 Trimble Survey Controller를 사용하여 현장에서 측설된 포인트들을 표시합니다. [측설] 탭에는 다음과 같은 페이지들이 있습니다.

  측설 델타

  선형 내역

  캐치점

  스토리 보드

  DTM


등록 정보 창 - [측설] 탭 -측설 델타 페이지
등록 정보 창 − [측설] 탭 − 측설 델타 페이지

이 페이지는 측설점과 설계점의 위치 차이를 보는 데 사용됩니다.

이 페이지를 보려면 등록 정보 창 에서,

 [측설] 탭을 선택하고 [측설 델타] 메뉴 단추 [image] 를 클릭합니다.

방법

이 필드는 측설된 요소를 표시합니다. 예를 들면 포인트, 선, 호, 또는 도로와 같은 것들 입니다.

'극' 옵션이 선택된 경우, 다음과 같은 필드들이 나타납니다.

방위각

이 필드는 설계점에서 측설점까지의 방위각을 보여 줍니다.

길이

이 필드는 설계점에서 측설점까지의 거리를 보여 줍니다.

'그리드 델타' 옵션이 선택된 경우에는 다음과 같은 필드들이 표시됩니다:

델타 X 좌표

이 필드는 설계점과 측설점의 X 좌표 차를 보여 줍니다.

델타 Y 좌표

이 필드는 설계점과 측설점 간의 Y 좌표 차를 보여 줍니다.

'스테이션 및  옵셋' 옵션이 선택된 경우, 다음과 같은 필드들이 표시됩니다:

델타 스테이션

이 필드는 설계점과 측설점 간의 거리 차 (설계 중심선에 평행) 를 보여 줍니다.

델타 옵셋

이 필드는 설계점과 측설점 간의 거리 차 (설계 중심선에 직각) 을 보여 줍니다.

델타 표고

이 필드는 설계점 (측설될 포인트) 과 측설점 간의 표고차를 보여 줍니다.

절토/성토

이 필드는 설계점 (실제 측설된 포인트)과 측설점 간의 표고차를 보여 줍니다.

다음과 같은 경우 외에는 델타 표고와 절토/성토 값은 동일합니다.

  설계 지형면이 수평 평면이 아닌 경우, 그리고

  포인트를 측설 하는 데 수평오차에 심각한 오류가 있을 경우

다음 그림은 설계 지형면이 수평 평면이 아닐 때 델타표고와 절토/성토 간의 차이를 보여 줍니다.

측설점이 캐치점이면 보고되는 델타 값들은 측설된 위치로부터  계산된 캐치점까지 입니다.


등록 정보 창 - [측설] 탭 - 선형 내역
등록 정보 창 − [측설] 탭 − 선형 내역

이 페이지는 선형 피쳐 ( 예를 들어 선, 호 또는 도로)로부터의 측설 내역을 보는데 사용됩니다.

이 페이지를 보려면 등록 정보 창에서,

 [측설] 탭을 선택하고 [선형 내역] 메뉴 단추 [image] 를 클릭합니다.

이름

이 필드는 포인트의 측설 기점이 되는 선형 피쳐의 이름을 표시합니다.

스테이션

이 필드는 측설에 선택된 포인트의 설계 스테이션을 표시합니다.

수평 옵셋

이 필드는 설계점으로부터 측설점까지의 수평 옵셋을 보여 줍니다. 도로의 경우, 이 필드는 수평 시공 옵셋을 표시합니다.

수직 옵셋

이 필드는 설계점으로부터 측설점까지의 수직 옵셋을 보여 줍니다. 도로의 경우, 이 필드는 수직 시공 옵셋을 표시합니다.

도로가 측설되었으면, 다음과 같은 필드들도 표시됩니다.

설계 옵셋

이 필드는 측설될 포인트의 설계 옵셋을 표시합니다.

설계 표고

이 필드는 측설될 포인트의 설계 표고를 표시합니다.

피쳐 이름

이 필드는 피쳐의 이름을 표시합니다.

수평 옵셋 방식

이 필드는 수평 옵셋이 어떻게 적용되는지를 표시합니다. 수평 옵셋은 다음과 같이 적용될 수 있습니다:

  수평으로

  직전 템플리트 요소의 경사에


등록 정보 창 - [측설] 탭 - 캐치 점
등록 정보 창 − [측설] 탭 − 캐치 점

이 페이지는 캐치 점에 관한 내역을 보는데 사용합니다. 이 옵션은 도로상에 측설된 포인트가 곧 캐치 점일 때만 이용 가능 합니다.

이 페이지를 보려면, 등록 정보 창에서,

 [측설] 탭을 선택하고,  [캐치 점] 메뉴 단추 [image] 를 클릭합니다.

설계 지형면이 자연 지형면과 교차되는 포인트를 캐치 점이라 합니다. 다음 그림은  일반적인 도로의 횡단면도를 보여 줍니다.

여기서:

A = 중심선까지 거리

B = 캐치점에서 힌지점까지의 수평거리

C =캐치점에서 힌지점까지의 수직거리

D = 측면 경사

E = 힌지점까지의 사거리

F = 시공 수평 옵셋

G = 절토 측구 폭

H = 힌지 점

J = 캐치 점

측면 경사

이 필드는 측면 경사 값을 보여 줍니다.

절토 측구 폭

이 필드는 절토 측구 폭 값을 보여 줍니다. 위 그림에서 밎�로 표시됩니다.

측면 경사 형식

이 필드는 측면 경사 형식을 보여 줍니다. (예를 들어, 절토 또는 성토).

중심선까지 수평거리

이 필드는 측설 캐치 점에서 중심선까지의 수평거리를 보여 줍니다.

표고

이 필드는 캐치 점의 측설 표고를 보여 줍니다.

힌지 점까지 수평거리

이 필드는 캐치 점에서 힌지 점까지의 수평 거리를 보여 줍니다.

힌지 점까지 수직거리

이 필드는 캐치 점에서 힌지 점까지의 수직 거리를 보여 줍니다.

힌지 점까지 사거리

이 필드는 캐치 점에서 힌지 점까지의 사 거리를 보여 줍니다.

사거리 + 시공 옵셋

이 필드는 측설 점에서 힌지 점까지의 사거리를 보여 줍니다. 위 그림에서는 힌지 점 밐�로부터 정의된 포인트까지의 사거리로 나타납니다. 이 포인트는 측설된 위치와 교차할 때까지 측면 경사를 투영함으로 정의됩니다. 다음과 같은 경우 이 값은 공백값이 됩니다.

  적용되는 수평 시공 옵셋 없을 경우

  수평 시공 옵셋이 수평으로 적용될 경우


등록 정보 창 - [측설] 탭 - 스토리 보드
등록 정보 창 − [측설] 탭 − 스토리 보드

이 페이지는 캐치 점으로부터 템플리트 상의 포인트까지 거리를 보는데 사용합니다.

이 페이지를 보려면, 등록 정보 창 에서,

 [측설] 탭을 선택하고, [스토리 보드] 메뉴 단추 [image] 를 클릭합니다.

이름

이 필드는 템플리트 상 포인트의 이름을 표시합니다.

캐치 점으로부터 수평 거리

이 필드는 캐치 점으로부터 템플리트 상의 해당 포인트까지의 수평 거리를 보여 줍니다.

캐치 점으로부터 수직 거리

이 필드는 캐치 점으로부터 탬플리트 상의 해당 포인트까지의 수직거리를 표시합니다.


등록 정보 창 - [측설] 탭 - DTM
등록 정보 창 − [측설] 탭 − DTM

DTM 페이지는 측설된 DTM 포인트의 내역을 보는데 사용합니다.

이 페이지를 보려면 등록 정보 창 에서,

 [측설] 탭을 선택하고DTM 메뉴 단추 [image] 를 클릭합니다.

DTM 이름

이 필드는 DTM의 이름을 보여 줍니다.

수직 옵셋

이 필드는DTM과 측설될 지형면 사이에 지정된 수직 옵셋을 보여 줍니다.

절토/성토

이 필드는 DTM점(수직 옵셋 포함)과 측설점 간의 표고 차를 보여 줍니다.


등록 정보 창 - [측량] 탭 - 방위각 관측치
등록 정보 창 − [측량] 탭 − 방위각 관측치

방위각 관측치를 보거나 편집하려면 등록 정보 창 의 [측량] 탭을 사용합니다. 측량 정보는 페이지 형식으로 정리되어 있습니다.

아래와 같이 메뉴 해당 단추를 클릭하면 그 페이지를 볼 수 있습니다:

요약
경고
관측치 통계


등록 정보 창 - [측량] 탭 - 요약 페이지(방위각 관측치)

요약 페이지는 등록 정보 창에서 선택한 방위각 관측치의 내역을 요약합니다

1.	측량 보기 화면에서 해당 방위각 관측치를 선택합니다.

2. 	 페이지를 보려면, 등록 정보 창에서 [요약] 메뉴 단추 [image] 를 클릭합니다.

참조: 방위각 관측치는 AZ 접두부를 가집니다.

시점

관측치가 구해진 시점의 이름을 표시합니다.

종점

방위각 관측치를 구한 종점의 이름을 표시합니다.

방위각

이 필드는 시점과 종점 사이에 방위각을 표시합니다. 그리드 또는 법선면 전방 방위각이 표시됩니다. 이 필드는 방위각 종류와 방위각 보기의 내용이 동일한 경우에만 편집할 수 있습니다.

질

방위각 관측치의 등급을 표시합니다.

방위각 종류

이 그룹은 방위각이 그리드와 법선면 전방 방위각 중 어느 종류로 데이타베이스에 저장 되는지를 보여줍니다.

참조: 종점이 방위각이 없는 경우, 그리드 방위각과 법선면 전방 방위각 사이에 변환은 계산할 수 없습니다. 이 경우, 방위각은 공백값으로 표시됩니다.

방위각 보기

이 보기 옵션은 방위각이 등록 정보 창에 방위각이 표시되는 방법을 선택하기 위해 사용됩니다:

  그리드 - 그리드 방위각을 표시하려면 이 옵션을 선택합니다.

  법선면 전방 - 법선면 전방 방위각을 표시하려면 이 옵션을 선택합니다.

참조: 사용자가 방위각 필드를 편집하기 원하면, 방위각 종류 필드의 정보와 이 보기 옵션의 정보가  동일해야 합니다.

상태

이 목록으로부터 원하는 관측치의 상태를 선택합니다. 이 상태는 재계산, 또는 측량 계산 시에 고려됩니다.

다른 관측치나 좌표가 없어 이 관측치를 포인트의 위치를 정하는데 사용 하기를 원하면,  '점검점으로 이용' 상태로 합니다. 그러나 이 관측치가 포인트의 위치를 정하는데 사용 되기를 원치 않으면 (예를 들어, 관측치가 폐합오차를 만드는 경우), 관측치를 '불이용' 상태로 합니다.

재계산 보고서는 '점검점으로 이용' 상태로 한 관측치는 보고하나 '불이용' 상태의 관측치는 보고하지 않습니다.

망 조정에 이용

선택한 관측치를 망 조정에는 이용 (망 조정 모듈이 설치된 경우) 하지 않고 데이타베이스를 재계산 할 때만 사용하고자 할 때는 이 확인란을 선택하지 않습니다.


등록 정보 창 - [측량] 탭 - 관측치 통계 페이지 (방위각 관측치)
등록 정보 창 − [측량] 탭 − 관측치 통계 페이지 (방위각 관측치)

이 페이지는 선택한 관측치에 따른 해당 해의 통계와 질 표지를 나타냅니다. 방위각 관측의 경우, 표준 오차가 보입니다. 이 페이지를 이용하여 해의 질을 점검합니다.

이 페이지를 보려면 등록 정보 창에서,

 [측량] 탭을 선택하고 [관측치 통계] 메뉴 단추 [image] 를 클릭합니다.

표준 오차

이 필드는 방위각 관측치의 표준 오차를 입력하는데 사용됩니다.

참조: 표준 오차가  0°00'00"이면 조정 중 방위각을 교정합니다.


등록 정보 창 좌표
등록 정보 창에서 좌표 관리

Trimble Geomatics Office에서는 사용자가 등록 정보 창에서 포인트의 [좌표 추가]  단추 [image] 를 이용하여 좌표 추가 를 할 수 있습니다. 이 단추를 클릭하면, 바로가기 메뉴가 나타납니다. 이 메뉴에서 추가하기를 원하는 좌표 종류를 선택합니다. 종류에는WGS-84, 그리드, 또는 로컬이 있습니다. 포인트에 대한 저장 좌표와 좌표의 출처가 등록 정보 창의 왼쪽 나무 계층 구조 목록에 표시됩니다.

포인트와 연관 시킬 수 있는 입력 좌표의 수에는 제한이 있습니다. 각 포인트에 하나의  WGS-84 좌표와 하나의  그리드(또는 로컬) 좌표만을 입력할 수 있습니다. 만약 사용자가 WGS-84 좌표를 이미 추가했으면, WGS-84 좌표 옵션은 불이용 상태가 됩니다.

관측치 대신 확실히 입력 좌표를 사용하고자 하는 경우에만 좌표를 추가해야 합니다. 왜냐하면  재계산 기능은 키입력 좌표를  동일한 등급의 다른 관측치에 우선하여 사용하기 때문입니다. 이는 설계점이 측설점에 우선하여 사용되도록 하기 위한 것입니다.

참조: 접두부가 입력 좌표 이름에 붙는데 이것은 좌표가 그리드(G), 로컬 (L) 또는 WGS-84 (W) 중 어떤 좌표인지를 표시하기 위한 것입니다.

Trimble Geomatics Office를 이용하여 포인트에 대한 추가 좌표들을 만들어 저장할 수 있습니다. 다음과 같은 좌표들이 포함 될 수 있습니다:

  조정치로부터 도출된 좌표

  캘리브레이션을 위해 저장된 조정 WGS-84 좌표

사용자가 새 좌표를 추가 시, 좌표의 구성 요소 값은 공백값으로 나타납니다. 사용자는 [현재 값 삽입] 단추 [image] 를 이용하여 요약 페이지에 보여진 것과 같이 각 좌표 구성 요소 필드를 해당 좌표 구성 요소의 현재 값과 질로 채울 수 있습니다. 이 단추는 사용자가 채우기를 원하는 좌표 구성 요소 필드를 선택할 경우에만 사용 가능 합니다.

좌표 편집

사용자는 입력 좌표 편집 을 할 수 있습니다. 그러나, 소프트웨어에 의해 만들어진 조정 및 캘리브레이션 좌표는 편집 할 수 없습니다.

사용자는 현재 보기가 [좌표형으로 저장] 설정과 동일한 경우에만 좌표 구성 요소를 편집할 수 있습니다. 구성 요소가 편집될 때, 출처는 사무실 입력으로 바뀝니다. 그리고 몇 개의 구성 요소만 편집된 경우에는 다중출처로 바뀝니다.

다중 출처로부터의 좌표

좌표 출처는 등록 정보 창에 나타납니다. 좌표가 둘 또는 그 이상의 출처로부터 도출되었으면 다중 출처로 나타납니다. 예를 들어, 포인트의 수평 좌표가 외부에서 가져온 파일로부터 도출되었고, 타원체고는Trimble Geomatics Office에서 입력되었으면 포인트가 다중 출처로부터 도출된 좌표를 가지는 것으로 나타납니다.

팁: 사용자는 각 구성 요소의 출처를 확인하기 위해 좌표 페이지에서 도구팁을 사용할 수 있습니다.

좌표 이동

Trimble Geomatics Office에서 좌표를 이동하거나 변환시키면, 관측치의 모든 내용이 불이용 상태가 됩니다. 따라서 해당 좌표를 재계산하려면 이들을 다시 '이용' 상태로 만들어야 합니다. 그렇게 하려면 다중 편집 대화 상자를 사용합니다.

좌표 삭제

좌표를 삭제하려면 [삭제] 단추 [image] 를 사용합니다.

참조: 조정을 위해 고정된 좌표는 수정할 수 없습니다.

좌표 질 등급

등록 정보 창에 나타난 각 좌표는 지정된 등급을 갖습니다. 다음의 좌표 등급은 편집할 수 있습니다:

  기준 등급

  측량 등급

  매핑 등급

  미지 등급

고정 기준점의 등급은 변경 할 수 없습니다.


등록 정보 창 - [측량] 탭 - 이벤트  페이지
등록 정보 창 − [측량] 탭 − 이벤트  페이지

이벤트 데이터를 보기 원하면 등록 정보 창 의 [측량] 탭을 이용합니다.

이 페이지를 보려면 등록 정보 창에서,

 [측량] 탭을 선택하고 [이벤트] 메뉴 단추 [image] 를 클릭합니다.

수신기 이벤트 ID

이 필드는 이벤트의 ID를 보여줍니다.

보간법

이 필드는 보간법이 선형인지 2차 함수형인지를 보여줍니다.

적합 포인트 수

이 필드는 보간 호(Interpolation arc)의 맞춤에 사용되는 포인트의 개수를 보여 줍니다.

수신기 포트 ID

이 필드는 수신기의 포트 ID를 보여줍니다.

해 유형

이 필드는 해의 유형을 보여 줍니다.

RMS (제곱 평균 제곱근)

RMS 값을 보여 줍니다.

상태

목록으로부터 원하는 관측치의 상태를 선택합니다. 이 상태는 재계산, 또는 측량 계산 시에 고려됩니다.


등록 정보 창 - [스테이션과 옵셋] 탭
등록 정보 창 − [스테이션과 옵셋] 탭

[스테이션과 옵셋] 탭 하에서는 Trimble 장치에서 스테이션 및 옵셋 프로그램으로써 측정된 포인트의 정보가 표시됩니다 .

등록 정보 창으로부터:

1.	[스테이션과 옵셋] 탭을 선택합니다.

2.	[스테이션/옵셋] 단추를 클릭합니다.

이름

이 필드에는 선형 피쳐의 이름이 들어 있습니다.

스테이션

이 필드는 측정된 포인트에 대한 선형 피쳐의 스테이션을 표시합니다.

참조: Trimble 3300 측량기의 경우, 기준선으로부터 사용된 시공 옵셋이 있다면 선의 시종점 이름과 함께 이름 필드에 이 옵셋이 표시됩니다.

옵셋

이 필드는 측정된 포인트에 대한 선형 피쳐로부터의 옵셋을 표시합니다.

델타 표고

이 필드는 선형 피쳐의 스테이션과 측정된 포인트 간의 표고차를 보여 줍니다.


GPS 사이트 캘리브레이션- 개요
    GPS 사이트 캘리브레이션− 개요

추가 정보

방법 ...	대화 상자

개요

GPS 사이트 캘리브레이션이란 GPS 수신기가 수집한 WGS-84 데이터와 로컬 기준점 (해수면 위의 표고 값을 가지는 로컬 맵 그리드로 표시) 간의 관계를 정하는 과정을 의미합니다. 이 관계는 일련의 수학적 변환으로 정의 됩니다. GPS 사이트 캘리브레이션 기능은 캘리브레이션에 사용될 GPS 점과 로컬 기준점이 쌍을 이루도록 해 줍니다. (GPS 좌표는 GPS 점과 관측치로부터, 그리고 그리드 점은 그리드 점과 비 GPS 관측치로부터 도출되어야만 합니다). 그 다음, Trimble Geomatics Office는 최소 자승법을 사용하여 수학적 변환을 계산한 후 이를 적용합니다. 캘리브레이션은 언제나 다시 실행 할 수 있습니다.

WGS-84 위치를 그리드 좌표로 변경하기위해 적용하는 수학적 변환은 다음과 같습니다.

1.	 WGS-84위도, 경도, 타원체고 좌표를 로컬 맵 그리드 타원체의 위도, 경도, 타원체고 좌표로 변환하는 데이텀 변환

2.	로컬 타원체 위도와 경도 좌표를 로컬 맵 그리드 X 좌표와 Y 좌표 좌표 (타원체고값은 이 과정에서 변경되지 않음)로 변환하는 투영법

3.	WGS-84고로부터 근사 해수면 표고를 얻기 위한 지오이드 모델

4.	로컬 기준 데이터에 가장 적합한 변환 그리드 좌표의 수평 조정. 이 조정은 전체 데이텀 변환에서는 다룰 수 없는 투영 시스템의 국지적 변이를 수용합니다.

5.	로컬 타원체고 또는 지오이드 표고를 로컬 기준 해수면 표고로 변환하는 타원체고 조정

캘리브레이션 설정 (허용 최고 잔차의 설정) 을 변경하려면 컴퓨터의 레지스트리를 이용합니다.

위의 수평, 수직 조정은 프로젝트 좌표계 정의의 일부분으로서 저장됩니다. 데이터베이스의 모든 GPS 점는 캘리브레이션 매개 변수를 사용하여 업데이트 되며, 결과적으로 좀더 정확한 로컬 그리드 좌표값을 얻을 수 있게 됩니다.

동일 지역에서 추후의 프로젝트에 사용하기 위해 (캘리브레이션 매개변수를 포함한) 새 좌표계 정의를 하나의 사이트로 저장하려면 [캘리브레이션] 대화 상자에서 [사이트로 저장]을 클릭 합니다.

다른 프로젝트에서 사용할 목적으로 캘리브레이션을 하나의 사이트로 저장할 경우 그 캘리브레이션에서 사용된 포인트가 프로젝트 영역을 완전히 둘러 싸고 있어야 합니다. 다음 그림의 예를 보면 프로젝트 B에는 사이트 정의를 사용할 수 있지만 프로젝트 C에는 그렇지 못함을 볼 수 있습니다.

Trimble Survey controller의 [image] 키를 사용하여 실시간 Kinematic (RTK) 베이스 측량을 시작하고 Survey Controller (.dc) 파일을 Trimble Geomatics Office로 전송할 경우, 베이스 위치의(그러므로 베이스로부터의 모든 로버 포인트도) 모든 구성 요소, 수평, 타원체고, 표고는 미지 등급이 부여됩니다.

GPS 사이트 캘리브레이션으로 포인트의 질 등급이 향상되었다고 확신하면, 등록 정보 창을 이용하여 베이스 포인트의 질을 변경하십시오.

참조: WGS-84 좌표가 있는 RTK 기지국 포인트를 이용하여 GPS 사이트 캘리브레이션을 수행하는 경우, 포인트의 그리드 좌표는 이용 해제되게 됩니다(기본값임). 하지만 GPS 사이트 캘리브레이션에 이 그리드 위치를 사용할 수 있습니다. 그렇게 하고자 하면 그리드 좌표(그리드 좌표가 WGS-84 좌표 보다 높은 등급을 가져야 합니다)를 '이용' 상태로 하고, 데이터 형 기준으로 포인트를 분해한 후, 재계산을 수행해야 합니다. 그렇게 하지 않아 그리드 위치가 GPS 벡터의 시점이 되어 버리면

  베이스에서 도출된 GPS 점은 어느 것도 캘리브레이션에서 사용할 수 없습니다.

  캘리브레이션 잔차에 상당하는 오차가 생길 수 있습니다.

참조: GPS 사이트 캘리브레이션을 실시하고 [로컬 사이트 설정] 대화 상자 의 [지상 좌표 이용] 확인란을 선택한 경우, 프로젝트에서 정의한 캘리브레이션은 사용할 수 없게 됩니다. 작업을 계속할 경우 캘리브레이션이 삭제된다는 경고 메시지가 나타납니다.

지오이드 모델 사용

프로젝트의 좌표계에서 지오이드 모델을 사용하여 포인트 표고의 결정을 하도록 정의한 경우 표고는 지오이드 모델 그리드 상에서 보간법에 의해 WGS-84고로부터 직접 결정됩니다. 그러나 대축척의 지오이드 모델이 고려할 수 없는 적은 국지적 변이를 수용하기 위해, 지오이드 모델에 의해 생성된 표고에 덧붙여 타원체고 조정을 추가 적용할 수도 있습니다. 수직 캘리브레이션에 의해 결정된 표고 값에는 측량 등급이 부여됩니다.

유용한 캘리브레이션이 되기 위한 규칙

  WGS-84 좌표가 비교적 정확해야 합니다.

단독 측위 GPS 점을 생성할 수 있습니다. 그러나 캘리브레이션에 쓰는 단독 측위 WGS-84 점이 하나를 초과해서는 안됩니다. 예를 들어, Trimble Survey Controller의 [image] 키로써 설정하는 기지국이 하나를 초과하여서는 안됩니다. 다른 기지국은 이 단독 측위 기지국을 기준으로 GPS 벡터에 의해 측정한 위치 상에 설정하여야 합니다. 그러면, 기지국 간의 관계가 정의되고, 따라서 둘 중 아무 기지국에서나 사용된 포인트를 이용하여 정확한 캘리브레이션을 수행할 수 있게 됩니다. 이 사항은 아래에 설명되어 있습니다.

다음 그림에서 양 기지국 사이에는 아무 관계도 없습니다.

베이스 1과 베이스 2 의 포인트를 캘리브레이션에 사용해서는 안됩니다.

다음 그림에서는 첫번째 기지국을 이용하여 두번째 기지국을 선점함으로서 양 기지국 사이의 관계가 규정되었습니다.

베이스 1과 베이스 2의 포인트를 캘리브레이션에 사용할 수 있습니다.

  가능한 최선의 WGS-84 좌표를 측량의 첫 기지국에 대하여 사용해야 합니다.

GPS 벡터(실시간 또는 후처리)의 정밀도는 베이스 좌표의 정확도에 영향을 받습니다. 베이스 좌표에서 10m의 오차당 최고  1백만분의 1(1 ppm)까지의 오차가 생길 수 있습니다. 예를 들어, 1차적 WGS-84 기준점의 오차가 100 m이고 그 기선의 길이가 2 km일  경우, GPS 벡터에 2 cm의 불필요한  추가 오차가 생깁니다.


레지스트리를 이용한 캘리브레이션 설정의 변경

 개요 및 추가 정보

Trimble Geomatics Office를 설치할 때 아래 사항을 조절하는 레지스트리 설정이 사용자의 컴퓨터에 추가 됩니다:

  최소 자승법을 이용하여 캘리브레이션 매개 변수를 계산할 때 실행되는 반복 연산 횟수

  캘리브레이션 점에 대한 캘리브레이션된 그리드 위치와 알려진 그리드 위치 간의 최대 허용 오차

레지스트리 내용(entry)을 입력함으로써 경고가 나타나는 시점을 조절할 수 있습니다. 경고는 계산이 지정 최대 오차 기준에 부합하지 않는다는 것을 의미합니다.

레지스트리 내용

레지스트리 내용(최대 오차 및 최대 반복 연산 수)은 다음과 같은 레지스트리 키에 있습니다:

HKEY_CURRENT_USER\Software\Trimble\Trimble Geomatics Office\1.6\Calibration

최대 오차

최대 오차를 변경하려면 이 엔트리를 이용합니다. 이 값은 계산된 캘리브레이션 점 위치와 그 관련 그리드 위치(알려진) 간의 최대 허용 수평 극 오차(잔차)입니다.

이 지정 오차를 초과할 경우, 캘리브레이션 계산이 최대 수평 잔차를 초과하였다는 오류 메시지가 나옵니다.

다음과 같은 상황에서는 캘리브레이션 결과가 지정 최대 오차를 초과 할 수 있습니다.

  그리드 기준점의 엔트리에 오류가 생겼을 때

  측량 도중 기준점이 잘못 식별되었거나 부정확하게 고정되었을 때

 캘리브레이션 계산이 반복 연산의 지정 횟수 내에 수렴하지 않을 때

[최대 오차] 필드의 값이 작을수록 최대 오차를 초과하였다는 메시지가 나타날 가능성이 증가합니다. 이것은 알려진 위치에 계산 위치를 매치하는 기준이 더욱 엄격하게 설정되기 때문입니다.

이 필드의 기본값 (항상 미터로 정의)은 0.1 m입니다.

최대 반복 연산 횟수

최대 반복 연산 횟수를 변경하려면 이 엔트리를 이용합니다. 최소 자승법으로 캘리브레이션 매개 변수를 계산할 때 실행되는 최대 반복 연산 횟수를 조절할 수 있게 합니다. 높은 값을 설정하게 되면, 연산을 거듭함에 따라 계산되는 매개 변수가 계속 바뀌는 한 그 만큼 더 반복 연산을 합니다.

이 값의 유효한 범위는 5부터 5000까지 입니다. 5 미만의 값을 설정하면 최소값인 5 가 사용되고, 5000을 초과하는 값을 설정하면 최대값인 5000이 사용됩니다. 기본 반복 연산 횟수는 10 입니다.


[GPS 사이트 캘리브레이션] 명령

GPS 사이트 캘리브레이션을 수행하려면 이 명령을 이용합니다.

이 명령을 실행하려면 [측량 / GPS 사이트 캘리브레이션]을 선택합니다.

[GPS 사이트 캘리브레이션] 대화 상자가 나타납니다.

참조: [GPS 사이트 캘리브레이션] 대화 상자가 나타나기 전에 망 조정 변환 매개변수를 정의한 경우, GPS 사이트 캘리브레이션을 수행 시 그 값은 폐기됩니다. 병합된 포인트와 동일한 이름을 가진 포인트가 있을 경우, 데이터 형을 기준으로 하여 포인트의 분해를 할 것인지 여부를 묻는 메시지가 나옵니다.


[GPS 사이트 캘리브레이션] 대화 상자

 개요 및 추가 정보

GPS 사이트 캘리브레이션을 수행하려면 이 대화 상자를 사용합니다.

이 대화 상자는 [측량 / GPS 사이트 캘리브레이션] 명령을 실행하여 불러옵니다.

GPS 사이트 캘리브레이션을 수행하려면:

1.	어떤 캘리브레이션 요소를 계산할지 지정합니다

2.	좌표 쌍의 목록을 정의합니다. 좌표 쌍은 물리적으로 동일한 포인트에 대한 그리드 도출 위치와 GPS도출 위치를 말합니다..

3.	현재 캘리브레이션을 데이터베이스에 적용합니다.

캘리브레이션 요소

[캘리브레이션 요소] 상자는 다음과 같은 확인란과 필드를 포함합니다.

데이텀 변환

좌표계 정의의 일부분으로서 사전 정의 된 데이텀 변환법이 보통 있게 마련입니다. 이 데이텀 변환은 3 매개 변수법이나 7 매개 변수법, 다중 회귀 정의일 수도 있고, 또는 데이텀 그리드 파일(예를 들어 NADCON)에 기초를 둘 수도 있습니다. 이 경우, 사용자가 다른 데이텀 변환을 계산하고자 할 가능성은 거의 없기 때문에 [데이텀 변환] 확인란을 선택 해제하도록 합니다. 하지만 이용 가능한 데이텀 변환 정보가 없거나 이용 가능한 매개 변수가 불확실한 상황일 경우에는 데이터 변환을 계산합니다.

프로젝트 좌표계 정의의 일부분으로서 사용된 WGS-84 타원체와 로컬 타원체 간의 데이텀 변환을 계산하려면 이 확인란을 선택합니다. 3 매개 변수법 및 7 매개 변수법 옵션을 이용할 수 있습니다. 어떤 종류의 데이텀 변환법을 계산할지 선택합니다.

참조: 이 옵션은 기본 (Transverse Mercator) 투영법 좌표계가 적용되는 프로젝트 상에서는 이용할 수 없습니다. 기본 투영법은 WGS-84타원체를 바탕으로 하기 때문에 데이텀 변환을 요하지 않습니다.

데이텀 변환을 계산하여 캘리브레이션을 데이터베이스에 적용할 때 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭에 있는 [데이텀] 필드에는 '캘리브레이션' 이라고 표시됩니다.

기본 투영법의 원점을 업데이트

이 옵션은 현재 좌표계 정의가 기본 투영법을 사용할 때에만 활성화됩니다. [포인트 목록]의 첫번째 2차원 기준점을 이용하여 투영 원점을 업데이트 하려면 이 옵션을 사용합니다. 기본 투영법은 정의된 Y 좌표 상수 및 X 좌표 상수의 위도/경도 원점이 없기 때문에 원점을 업데이트 하면 프로젝트의 원점이 확실히 로컬화 (즉 프로젝트의 측량 데이터에 근접) 됩니다

기 정의된 기본 투영법이 있는 프로젝트상에서 GPS 캘리브레이션을 수행하고자 할 경우에는 기본 투영법 정의가 변경되지 않도록 이 확인란을 선택 해제 합니다.

수평 조정

수평 조정을 계산하려면 이 옵션을 선택합니다. [축척 계수를 1로 설정] 확인란이 활성화됩니다.  거리에 축척을 적용하지 않고자 하면 이 옵션으로써 축척계수를 1로 설정합니다. 수평 조정은 평면 변환법으로서, 그 구성 요소는 북/남 방향 평행 이동, 동/서 방향 평행 이동, 정의된 원점 기준의 회전, 그리고 축척 계수 등입니다. 변환 매개 변수는 GPS 위치에 적용될 때 기준 그리드 좌표에 가장 적합한 조정 매개 변수를 제공하는 변환을 찾기 위해 최소 자승법을 사용하여 계산됩니다.

수평 조정은 GPS 위치로부터 계산된 기준 좌표와 그리드 좌표 사이의 잔차 오차를 줄여줍니다.

팁: 계산된 축척 계수가 1에 근접하는지를 점검하기 위해 처음에는 축척 계수를 1로 설정 하지 않고 수평 조정을 계산하는 것이 좋습니다. 계산된 축척 계수가 1에 근접하지 않는다는 것은 선택된 캘리브레이션 포인트 쌍에 문제가 있음을 의미할 수 있습니다.

수직 조정

수직 조정을 계산하려면 이 옵션을 선택합니다. 이것은 정의된 원점에서의 수직 이동, 북쪽과 동쪽 방향의 경사로 구성된 경사면 평면 조정입니다. 이 조정의 매개 변수는 기준점 표고를 가지고 있는 GPS고로부터 도출된 표고에 가장 적합한 조정 평면을 찾기 위해 최소 자승법을 사용하여 계산됩니다. 이 과정은 3개의 3차원 캘리브레이션 포인트 쌍을 필요로 합니다. 1 개의 3차원 캘리브레이션 포인트 쌍으로는 수직 이동 매개 변수만 계산할 수 있습니다. 2개의 3차원 캘리브레이션 포인트 쌍을 이용할 수 있는 경우, 시스템은 이 쌍에 적합한 보정 평면을 설정합니다.

프로젝트가 지오이드 모델을 사용하는 경우에는 지오이드 모델 보정에 추가하여 수직 조정이 계산되어 적용됩니다

지오이드 모델

[지오이드 모델] 필드는 좌표계 정의의 일부로 선택된 지오이드 모델의 이름을 보여줍니다. 지오이드 모델이 없을 경우 "없음"이 표시 됩니다. 이 필드는 표시 전용 필드입니다. 지오이드 모델 설정은 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭 을 사용하여서만 변경할 수 있습니다

포인트 목록

캘리브레이션 계산에 사용될 캘리브레이션 포인트 쌍을 선택하려면 이 단추를 클릭합니다. [GPS 사이트 캘리브레이션] 대화 상자는 숨겨지고 [포인트 목록] 대화 상자가 나타납니다.

계산 요약

이 상자의 필드는 수행된 마지막 캘리브레이션 계산의 요약을 표시합니다. 계산 보고서를 보지 않고 계산된 캘리브레이션이 올바른지 확인하려면 [계산요약]을 사용합니다.

수평 조정 축척 계수

[수평 조정 축척 계수] 필드는 수평 조정의 계산된 축척을 표시합니다. [축척 계수를 1로 설정] 확인란을 선택하였을 경우 이 필드는 1을 표시합니다. 이 필드를 사용하여 계산된 축척 계수가 1에 근접하는지를 확인합니다. 1에 근접하지 않는다는 것은 하나 또는 그 이상의 캘리브레이션 포인트 쌍에 문제가 있음을 나타냅니다.

최대 수직 조정 경사

[최대 수직 조정 경사] 필드는 계산된 경사 N 과 경사 E 값에 기초하여 계산한 타원체고 조정의 최대 경사를 표시합니다.

최대 수평 잔차 및 최대 수직 잔차

[최대 수평 잔차] 및 [최대 수직 잔차] 필드는 바로 전에 수행된 계산의 최대 잔차를 보여줍니다.

확인

바로 전에 계산된 캘리브레이션을 데이터베이스에 적용하려면 이 단추를 클릭합니다.

GPS 캘리브레이션에 따라 모든 GPS 점이 업데이트 되도록 재계산이 수행됩니다. 좌표계 내역이 이 캘리브레이션 매개 변수로써 업데이트 됩니다.

캘리브레이션 내역을 보려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다.

2.	[좌표계] 탭을 선택합니다.

3.	[자세히]를 클릭합니다.

4.	[수평 조정] 탭이나 [수직 조정] 탭을 선택합니다.

취소

계산된 캘리브레이션을 적용하지않고 [GPS 사이트 캘리브레이션] 대화 상자를 끝내려면 이 단추를 클릭합니다.

계산

캘리브레이션 요소 설정을 변경한 후 GPS 캘리브레이션 매개 변수를 계산하려면 이 단추를 클릭합니다. 계산이 수행된 후에는 계산 결과가 [계산 요약] 필드들에 요약됩니다.

사이트로 저장

좌표계 데이터베이스에 현재 캘리브레이션과 좌표계 내역을 사이트 정의로 저장하려면 이 단추를 클릭합니다. [사이트로 저장] 대화 상자가 나타납니다. 저장된 사이트 정의의 이름을 입력한 후 [확인]을 클릭합니다. 추후의 프로젝트에서 이 사이트 정의를 좌표계 정의로 사용할 수 있습니다.

좌표계

프로젝트의 현재 좌표계 내역을 보려면 이 단추를 클릭합니다. [파일 / 프로젝트 등록 정보] / [좌표계] 탭에서 [자세히]를 눌렀을 때 나오는 대화 상자와  같은 대화 상자가 나타납니다.

보고서

캘리브레이션 계산의 자세한 보고서를 보려면 이 단추를 클릭합니다. 이 보고서는 알려진 위치와 각 잔차 값과 비교한 계산 기준점 좌표의 목록 뿐만 아니라 계산 매개 변수가 모두 표시됩니다.


GPS 사이트 캘리브레이션 - [포인트 목록] 대화 상자
[GPS 사이트 캘리브레이션 − 포인트 목록] 대화 상자

GPS 사이트 캘리브레이션 매개 변수를 계산하는 데 사용할 캘리브레이션 포인트 쌍을 선택하려면 이 대화 상자를 이용합니다.

이 기능을 이용하려면:

1.	[측량 / GPS 사이트 캘리브레이션]을 선택합니다. [GPS 사이트 캘리브레이션] 대화 상자가 나타납니다.

2.	[포인트 목록]을 선택합니다

[GPS 사이트 캘리브레이션 - 포인트 목록] 대화 상자가 나타납니다.

이 대화 상자는 캘리브레이션 포인트 쌍 그룹의 목록을 보여줍니다. 캘리브레이션을 계산하기위해 설정될 수 있는 캘리브레이션 포인트 쌍의 수에는 특별한 제한이 없습니다. 많은 수의 캘리브레이션 쌍을 추가하는 것이 캘리브레이션 결과를 항상 향상 시키지는 않지만, 계산되는 매개 변수의 타당성을 점검하는 추가 장치로서의 기능을 합니다.

각 캘리브레이션 포인트 쌍은 하나의 GPS 점 (GPS 위치를 가지고 있는 포인트 또는 GPS 벡터로부터 생성된 포인트) 과 GPS 점이 아닌 다른 하나의 그리드점 (이것은 일반적으로 기준점, 조정된 포인트 또는 비 GPS 관측치에서 생성된 것임) 으로 구성되어 있습니다.

참조: GPS 점는 WGS-84 좌표에서 나오는 GPS 벡터로부터 생성되어야 합니다. GPS 그리드 벡터에서 나오는 GPS 벡터는 GPS 점을 설정하는 데 사용할 수 없습니다.

포인트 목록에 포함할 포인트를 선택하거나 지정할 때 시스템은 각 GPS점에는 GPS 도출이 실제로 존재하고 각 그리드 점에는 GPS 도출이 없음을 확인합니다.

캘리브레이션 포인트 쌍의 위치는 그래픽 창에 강조되어 나타납니다. GPS 점에는 상자 모양의 심벌이 있고, 기준점에는 십자 모양의 심벌이 있으며 두 위치를 연결하는 선이 나타납니다. 자세한 내용을 보려면 캘리브레이션 포인트 쌍 중 하나를 확대해 보아야 합니다. 포인트 목록에 있는 현재 캘리브레이션 포인트 쌍의 심벌과 연결선이 점선으로 표시됩니다.

일반적으로 그래픽 창에서 해당 포인트를 선택하려면 필드 필인 기능을 사용하여 캘리브레이션 포인트 쌍의 포인트를 선택합니다. 필드 필인 기능은 GPS에서 생성된 포인트만 GPS점으로 선택하고 GPS 도출이 없는 포인트는 그리드 점으로 선택합니다. 또한 [GPS 점] 필드 및 [그리드 점] 필드에 사용하고자 하는 포인트의 이름을 입력할 수도 있습니다.

 사용된 그리드 표고(GPS고와 지오이드 모델로부터 생성되지 않은 것)가 GPS점에 있을 경우, 수직 조정 캘리브레이션에서 GPS 점과 그리드 점 양쪽 모두에 동일한 포인트를 사용할 수 있습니다. 이렇게 할 경우 [방식] 필드는 [수직]으로 설정됩니다.

참조: 두개의 상이한 포인트가 동일한 이름을 가질 경우 GPS점을 선택하면 자동으로 동일 이름의 그리드 포인트가 선택됩니다. GPS 및 그리드 좌표를 동일 포인트로 저장할 경우 포인트를 종류 기준으로 분해하여야 합니다.

데이터베이스에 적당한 그리드 기준점 이나 GPS 점이 없을 경우 제공된 필드에 이 포인트에 대한 적당한 좌표값을 지정 할 수 있습니다. 이 경우에 Trimble Geomatics Office는 데이터베이스에서 이 이름을 가진 포인트를 찾기 때문에 이 포인트에 이름을 지정하면 안됩니다. 이 방법으로 입력한 위치는 데이터베이스에 저장 되지 않습니다.

캘리브레이션의 좌표값 (GPS점 또는 그리드 점) 을 지정하려면:

1.	[이름] 필드에 있는 GPS 점 또는 그리드 점 옆의 플러스 (+) 아이콘 을 클릭합니다.

나무 계층구조가 확장되어 좌표 필드가 나타납니다.

2.	필드 필인 기능을 이용하거나 키보드로 좌표 필드에 값을 입력합니다.

GPS 사이트 캘리브레이션에 사용할 GPS 점을 선택할 수 없을 경우에는 GPS 사이트 캘리브레이션 포인트 선택상의 문제 항목 를 보십시오.

방식

캘리브레이션 계산에서 캘리브레이션 포인트 쌍의 사용 방법을 지정하려면 [방식] 필드를 사용합니다. 하나의 좌표쌍을 선택하면 Trimble Geomatics Office는 이 필드에 적절한 방식을 자동으로 입력합니다. 선택한 옵션이 유효하다면 이 방식을 변경할 수 있습니다. 예를 들어 기준점에 표고가 없을 경우 캘리브레이션 포인트 쌍의 [방식] 필드를 '수평 및 수직'으로 설정할 수 없습니다.

선택할 수 있는 옵션은 다음과 같습니다:

  수평 및 수직 - 이 캘리브레이션 포인트 쌍은 수평 및 수직 조정을 결정하는데 적절함을 말해 줍니다.

  수평 - 이 캘리브레이션 포인트 쌍은 수평 조정을 결정하는 데에만 적절함을 말해 줍니다. 사실상 그리드 점의 표고 값은 신빙성이 없습니다.

  수직 - 이 캘리브레이션 포인트 쌍은 수직 조정을 결정하는 데에만 적절함을 말해 줍니다. 사실상 그리드 점의 X 좌표 및 Y 좌표 값은 신빙성이 없습니다.

  (무시) - 이 캘리브레이션 포인트 쌍은 변환 매개 변수 계산에 사용되지 않음을 말해 줍니다. 이 옵션은 캘리브레이션 계산에 문제를 발견했을 경우, 그리고 의심이 가는 캘리브레이션 포인트 쌍을 발견하려고 할 경우에 유용합니다. 결과가 향상되었는지 보기위해 캘리브레이션 포인트 쌍을 임시로 계산에서 삭제 할 때 이 설정을 사용할 수 있습니다.

  (무효) - 이 옵션은 선택된 포인트 쌍이 올바른 포인트 쌍이 아니라는 것을 말해줍니다.

통계

이 상자의 필드에는 [포인트 목록]에 추가한 값에 따라 수행된 캘리브레이션 결과가 나타납니다. [포인트 목록]을 수용하기 전에 캘리브레이션 통계를 검사하고 잘못된 포인트 쌍을 찾아내려면 이 요약을 사용합니다.

수평 조정 축척 계수

[수평 조정 축척 계수] 필드는 수평 조정의 계산된 축척을 표시합니다. [축척 계수를 1로 설정] 확인란을 선택하였을 경우 이 필드는 1을 표시합니다. 이 필드를 사용하여 계산된 축척 계수가 1에 근접하는지를 확인합니다. 1에 근접하지 않는다는 것은 하나 또는 그 이상의 캘리브레이션 포인트 쌍에 문제가 있음을 나타냅니다.

최대 수직 조정 경사

[최대 수직 조정 경사] 필드는 계산된 경사 N 과 경사 E 값에 기초하여 계산한 타원체고 조정의 최대 경사를 표시합니다.

최대 수평 잔차 및 최대 수직 잔차

[최대 수평 잔차] 및 [최대 수직 잔차] 필드는 최대 잔차를 보여줍니다.

삽입

빈 캘리브레이션 포인트 쌍 레코드를 삽입하려면 이 단추를 클릭합니다. 이 기능은 기본 투영법을 사용하고 있고 투영법 원점을 업데이트 하고자 할 때 유용합니다. 첫번째 포인트 쌍은 원점을 업데이트하는데 사용됩니다. 목록에 추가하여 새로운 빈 캘리브레이션 포인트 쌍을 삽입하려면 이 단추를 사용합니다.

삭제

목록에서 캘리브레이션 포인트 쌍을 제거하려면 이 단추를 클릭합니다.


GPS 사이트 캘리브레이션 포인트 선택의 문제
GPS 사이트 캘리브레이션 포인트 선택상의 문제

GPS 사이트 캘리브레이션의 포인트를 선택하기 위해 [GPS 사이트 캘리브레이션  - 포인트 목록] 대화 상자 를 사용하면, 시스템은 캘리브레이션 포인트 쌍의 GPS 점 또는 그리드 점을 선택하도록 허용하지 않습니다.

그리드로부터 시점이 도출되기 때문에 GPS 점을 선택할 수 없습니다.

이 포인트는 그리드 위치로부터 생성된 벡터의 '시점'이 있는 벡터의 결과값입니다. 실시간 Kinematic (RTK) 측량 후 기지국의 그리드 위치를 입력한 경우, 이 같은 현상이 발생할 수 있습니다. 기지국에서 추출된 모든 벡터가 적용됩니다. 그러나 이 포인트의 위치는 WGS-84 값 (벡터) 과 그리드 값 (베이스 WGS-84 위치) 의 조합으로 생성됩니다. 베이스로부터 적용된 벡터를 가지고 있는 포인트는 이용할 수 없습니다. 다음 그림은 이를 보여주고 있습니다�

  포인트1 은 GPS 사이트 캘리브레이션에서 GPS 점으로 사용될 수 없습니다.

베이스 그리드 점이 WGS-84 로 변환된 후, 포인트 1의 위치를 결정하기 위하여 벡터가 적용됩니다.

  포인트 1 은 GPS 사이트 캘리브레이션에서 GPS 점으로 사용될 수 있습니다.

포인트 1의 위치를 결정하기 위해 베이스 WGS-84 위치에 벡터가 적용됩니다.

이 것을 교정하려면 등록 정보 창을 사용하여 포인트의 좌표를 수정하고 WGS-84 위치를 입력 합니다. 그리드 위치에 우선하여 이 값이 사용됩니다. 그리고 기지국에서 생성되는 모든 벡터는 GPS 사이트 캘리브레이션에서 GPS 점으로 이용할 수 있습니다.

시점이 그리드로 위치부터 생성 되었기 때문에 GPS 점을 선택할 수 없는 것과 같이, 시점이 GPS 위치로부터 생성된 경우 그리드 점을 사용할 수 없습니다. 그리드 점은 반드시 비 GPS 관측치로부터 생성되어야 합니다.


3매개 변수법 변환

정의된 좌표계가 없고 프로젝트 영역에 대한 사용자 자신의 데이텀 변환 매개 변수를 만들고자 할 때 GPS 사이트 캘리브레이션으로써 데이텀 변환을 정의합니다.

3매개 변수법 변환 알고리즘은 WGS-84 타원체 중심에서 로컬 투영 타원체 중심까지 X, Y, Z Cartesian 축을 따라 평행 이동하는 값을 계산합니다. 로컬 타원체의 공간 측위 및 WGS-84 타원체와의 연관성을 결정하기 위해 기준점 위치들을 사용합니다.


7매개 변수법 변환

정의된 좌표계가 없고 프로젝트 영역에 대한 사용자 자신의 데이텀 변환 매개 변수를 만들고자 할 때 GPS 사이트 캘리브레이션으로써 데이텀 변환을 정의합니다.

7매개 변수법 변환 알고리즘은 3개의 평행 이동 값, 3개의 회전 값, 그리고 WGS-84 타원체 및 로컬 투영 타원체 간의 축척 증감을 계산합니다. 3개의 평행 이동값은 3 매개 변수법 변환과 마찬가지로 WGS-84 타원체의 중심으로부터 로컬 타원체의 중심까지 X, Y, Z Cartesian 축을 따라 계산됩니다. 그리고 각 축에 대한 회전 값과, 두 타원체 사이의 크기 차이(타원체 장반경과 편평률 값이 다름으로 인해 야기되는)를 감안하는 축척 계수를 계산합니다.

로컬 타원체의 공간 측위 및 WGS-84 타원체와의 연관성을 결정하기 위해 기준점 위치들을 사용합니다. 계산된 평행 이동 값 과 회전 값 사이에는 밀접한 상관 관계가 있습니다 (지구 반경과 같은 큰 반경에 아주 작은 회전각을 적용한 결과값은 평행 이동값과 매우 비슷합니다). 이것은 기준점이 충분히 넓은 지역을 포괄하지 않을 경우, 부정확하고 큰 계산 보정 값이 나올 수 있다는 것을 의미합니다. 일반적으로 기준점이 대략 80 km X 80 km 정도의 지역을 대상으로 하지 않을 경우에는 7매개 변수법으로 계산해서는 안됩니다. 또한 계산된 회전값은 호의 10� 를 초과해서는 안됩니다.


GPS 관측치 - 개요
GPS 관측치 − 개요

 기타

GPS 관측치 또는 기선은 GPS로써 관측된 두 포인트 사이의 벡터입니다. 기선을 결정하는데 사용되는 두 포인트는 사용되는 측량 테크닉 에 따라 달라 집니다. 예를 들어 실시간 Kinematic (RTK) 측량이나 후처리 Kinematic (PPK) 측량에서는, 기지국에서부터 각 이동국까지 기선이 존재합니다.

그러나 Static 및 Fast static 측량 에서는 기지국이 존재하지 않습니다. 이 측량 테크닉 하에서의 GPS 벡터는, 다음 표에서 보는 바와 같이, 동일한 시간에 선점이 이루어진 포인트 사이에서 존재합니다.

어떤 기선의 종류를 확인하려면 등록 정보 창을 선택합니다.

Static, Fast Static 및 후처리 Kinematic (PPK) 벡터

후처리 되지 않은 Static, FastStatic 및 PPK 관측치는 처리되지 않은 기선입니다. 기선이 후처리 되었을 경우 후처리 기선이 됩니다.

후처리 된 기선을 삭제하면 기선은 잠재 기선으로 되돌아 갑니다. 포인트를 삭제함으로써 기선을 제거 할 수 있습니다. 추후 측량 계산에 사용하지는 않으나 포인트를 보존하고자 할 경우에는, 기선을 불이용 상태로 변경할 수도 있습니다.

PPK 연속 벡터

PPK 연속 벡터가 후처리 되면 PPK 기선과  같은 색으로 표시 됩니다. 그러나 등록 정보 창에는 측량 방식이 '연속'으로 표시됩니다.

RTK 벡터

RTK 벡터는 잠재 기선은 아닙니다. 등록 정보 창에 RTK 기선으로 표시됩니다. 연속 RTK 벡터는 RTK 기선과 동일한 색으로 표시되지만 등록 정보 창에는 측량 방식이 '연속'으로 표시됩니다.

점검 벡터

기선 상태가 '점검'으로 설정되어 있을 경우 기선은 대시 선(-)으로 표시됩니다.

불이용 벡터

기선 상태가 '불이용'으로 설정되어 있을 경우 기선은 불이용 기선의 색으로 표시됩니다.


GPS 선점

GPS로써 포인트가 관측될 때마다 GPS 선점 레코드가 생성됩니다.

등록 정보 창을 사용하여 GPS 선점 레코드를 보려면:

1.	다음 중의 한가지를 선택합니다:

  GPS 로써 관측된 포인트

  기선 (측량 화면에서)

2.	GPS 선점 레코드를 보려면 [image] 아이콘을 클릭합니다.

등록 정보 창을 이용하여 GPS로 관측된 포인트를 선택하면 그 포인트에 해당하는 모든 GPS 선점 레코드를 볼 수 있습니다. 등록 정보 창을 이용하여 기선을 선택하면 기선을 생성한 GPS 선점을 볼 수 있습니다.

GPS 선점 레코드는 다음과 같은 것을 포함하고 있습니다:

  포인트 이름

  선점 지속 시간 및 선점 시작 시간

  안테나 높이, 종류, 높이지점을 포함하는 GPS 안테나 내역

데이터 가져오기 중 시작 시간과 종료 시간이 GPS 시간에서 UTC (협정 세계시 � 사실상 그리니치 표준시)로 전환됩니다. 그리고 나서 Microsoft Windows의 현재 표준 시간대를 바탕으로 설정된 지역 시간으로 표시됩니다.


프리즘 상수

프리즘 상수는 토탈 스테이션으로 측정한 사거리를 보정하는 값입니다. 재계산 중에 이 프리즘 상수가 적용됩니다. 이 보정은 프리즘 반사경의 표면이 측량점의 바로 위에 있지 않기 때문에 필요합니다. 이 상수는 일반적으로 음수 값을 가집니다.

여기서:

	: 보정된 사거리
	: 측정된 사거리
	: 프리즘 상수

프리즘 상수 값은 타겟 설정 정보와 함께 저장됩니다.

프리즘 상수 값을 보거나 수정하려면:

1.	어떤 타겟 설정 포인트나 광파 관측치를 선택합니다.

2.	등록 정보 창을 불러옵니다.

    단추를 클릭합니다.

참조: 3300/3600/5600 Elta 및 3600/5600 GDM 소프트웨어에서는 프리즘 상수가 측량기에 적용되지만 파일에는 저장되지 않습니다. 프리즘 상수는 '?'로서 표시됩니다.

부정확한 프리즘 상수가 측량기에 설정되어 있고 Trimble Geomatics에서 그 값을 정정하고자 하면, 부정확한 프리즘 상수와 정확한 것과의 차이를 등록 정보 창의 프리즘 상수 필드에 입력하십시오. 예를 들어, �20�을 입력했지만 실제로는 �5�를 입력하여야 했었다면 뱰15�를 입력하도록 합니다.

팁: 다중 관측치를 수정하려면 [다중 편집] 대화 상자를 사용할 수 있습니다.


전자 거리 측정 장비(EDM) 설치 이심률 보정
전자 거리 측정기(EDM) 설치 이심률 보정

대부분의 최신 토탈 스테이션은 전자 거리 측정기(EDM)의 측정 경로가 망원경의 시준선과 일치하기 때문에 설치 이심률 보정을 할 필요가 없습니다. 망원경 장착 EDM이 경사 반사경(반사경/타겟이 EDM/망원경의 설정과 일치하도록 설계)과 함께 사용될 경우에는 이 보정이 필요하지 않습니다.

그러나 EDM 측정 경로가 망원경의 시준선과 일치하지 않아 측정 사거리에 대한 보정값을 계산함으로써 실제 사거리를 찾아내어야 하는 경우도 있습니다. 설치 이심률 보정은 장착 시스템의 종류에 따라 달라지는데, Trimble Geomatics Office에서는 아래 공식을 토대로 이를 자동으로 적용합니다.

적당한 옵셋 값이 장치 파일의 측량기 레코드에 저장됩니다.

1. 비경사 반사경의 표준 장착 EDM

여기서:

	: 보정 사거리
	: EDM 옵셋 (측량기)
	: 반사경 옵셋 (타겟)
	: 관측된 천정 수직각
	: 측정 사거리(프리즘 상수 보정 적용 후)

2. 비경사 반사경의 망원경 장착EDM

여기서:

	: 보정 사거리
	: EDM 옵셋 (측량기)
	: 반사경 옵셋 (타겟)
	: 관측된 천정 수직각
	: 측정 사거리
이 보정은 장치 파일을 가져오는 도중 적용됩니다.


기압 및 온도 보정

온도와 기압으로 야기되는 측정 길이의 변이를 보정하기 위해 전자적으로 측정한 거리 값에 기압 및 온도 보정을 적용합니다. 현장 작업 중 적당한 값을 입력하거나 장치  파일을 가져오기 전에 이를 수정할 수 있습니다.

EDM 전자 측정 거리는 공기를 통과하는 빛의 속도를 기준으로 합니다. 온도와 기압이 이 속도에 영향을 미칩니다.

EDM 이 이미 적절한 보정을 적용하지 않았을 경우, 대기 보정은 거리 측정값에만 적용됩니다.

여기서:

	: 보정 사거리
	: 측정 사거리
	: EDM 측량기의 반송 및 변조 주파수 에 대한 그룹 굴절 지수
	: EDM 측량기의 반송파 파장 상수 (mm Hg)
	: 대기압 (mm of mercury)
	: 건조 기온 (섭씨)
참조: Trimble Survey Controller소프트웨어에 기압과 온도를 기록할 것을 권고합니다. 이 보정치는 .dc 파일을 가져올 때 사거리에 적용됩니다.

참조: 3600/5600 Zeiss Elta 및 3600/5600 GDM, TDS Survey Pro 소프트웨어에서는 기압과 온도 보정치가 측량기에 적용됩니다. 따라서, 관측치는 Trimble Geomatics Office로 도입되기 전에 이미 보정됩니다.


수직 시준

수직 시준 보정은 수직각에 직접 적용되는 각도 보정입니다.

측량기의 양면을 사용하여 물체를 주의 깊게 관측함으로서 측량기의 수직 시준을 설정할 수 있습니다. 이 수직 시준 보정 값은 망원경의 십자선 위치가 약간 부정확하기 때문에 발생하는 일정한 오차를 말해줍니다.

측량기에 시준 오차가 있으면 장치 파일에 시준 레코드가 저장되고 수직 시준이 다음과 같은 모든 수직각에 적용됩니다.

정위:
반위:
여기서:

	: 보정 수직각
	: 관측 수직각 (천정 각도)
	: 수직 시준 보정값.  이 보정은 장치 파일을 가져오는 도중 적용됩니다.
참조: Trimble Survey Controller에는 시준 프로그램이 포함되어 있지 않습니다. 파일을 가져올 때는 시준 보정이 실행되지 않습니다.

참조: 3300/3600/5600 Elta 및 3600/5600 GDM, TDS Survey Pro 소프트웨어에서 수직 시준은 Trimble Geomatics Office로 도입되기 전에 적용됩니다.


굴곡 및 굴절
곡률 및 굴절

대기상에서의 빛 굴절 효과와 지구 곡률을 상쇄하기 위하여 관측 수직각에 곡률 및 굴절 보정을 적용합니다.

여기서:

	: 보정 천정 수직각
	: 관측 천정 수직각
	: 보정 사거리
	: 굴절 계수  - 일반적으로 0.142 또는 0.20인데 장치 파일의 작업 레코드 값에 따라 달라집니다.
	: 지구 반경
참조:

  이 포맷은 값을 라디안으로 산출합니다.

  Trimble Survey Controller 파일을 가져오는 도중 곡률 및 굴절 보정이 적용됩니다.

  3300/3600/5600 Elta 소프트웨어에서 곡률 및 굴절은 측량기에 적용됩니다. 따라서, 관측치는 Trimble Geomatics Office로 도입되기 전에 이미 보정됩니다

  3600/5600GDM 소프트웨어에서 곡률 및 굴절은 계산 좌표에 적용됩니다. Trimble Geomatics Office에서 원시 관측치가 도입, 보정됩니다 .

  TDS Survey Pro 소프트웨어에서 곡률 및 굴절 보정치는 Trimble Geomatics Office에로의 도입시 적용됩니다.


수평 시준

참조: Trimble Survey Controller에는 시준 프로그램이 포함되어 있지 않습니다. 파일을 가져올 때는 시준 보정이 실행되지 않습니다.

시준 레코드가 있을 경우 Trimble Geomatics Office는 다음의 식에 따라 수평 시준을 적용합니다:

정위:
반위:
여기서:

	: 보정 수평각
	: 관측 수평각
	: 수평 시준 보정값

필요 시 장치 파일을 가져오는 도중 이 시준 보정이 적용됩니다.

참조: 3300/3600/5600 Elta 및 3600/5600 GDM, TDS Survey Pro 소프트웨어에서 수평 시준은 Trimble Geomatics Office로 도입되기 전에 적용됩니다.


수평 배향

 기타

재계산 중에 후시 방위각을 사용하여 비 GPS 수평각에 방향이 부여됩니다. 방위각에 수평각이 추가됨으로 전시점 방위각이 생성됩니다. 이 것은 설정하려는 모든 관측치에 방향을 설정하여 줍니다.

후시 방위각을 결정하기 위해 다음 규칙을 사용합니다 (광파 관측치의 경우에만 적용).

  만일 기계점과 후시점의 위치만 알려져 있으면(즉, 키입력 방위각이 없다면) , 재계산은 두 포인트 간 인버스에서 얻어진 후시 방위각을 사용합니다

 만일 키입력 방위각만 이용이 가능하고, 해당 종점이 좌표를 가지고 있지 않으면,  재계산은 키입력 방위각을 후시 방위각으로 사용합니다.

  만일 기계점 및 후시점의 위치가 모두 알려지고, 키입력 방위각이 이용가능하면, 재계산은 각 방위각의 등급을 결정하고, 어떤 방위각을 후시 방위각으로 사용할 것인지 결정하기 위해 아래의 표에 있는 서열을 사용합니다.

예를 들어, 만일 기준 등급 키입력 방위각과 함께 측량 등급의 기계점과 후시점 쌍이 있으면, 키입력 방위각이 후시 방위각으로 사용됩니다.

참조: 후시 방위각의 등급을 계산하기위해서 기계점과 후시점의 수평 등급을 검토하여 최하 등급을 취합니다. 예를 들어, 만일 기계점이 기준 등급이고 후시점이 매핑 등급이면, 후시 방위각은 매핑 등급이 됩니다.

종류	등급
좌표로부터 도출	기준
키입력 방위각	기준
좌표로부터  도출	측량
키입력 방위각	측량
좌표로부터 도출	매핑
키 입력 방위각	매핑
참조:  만일 기계점과 후시점 간에 결정된 방위각에 우선하여 키입력 방위각을 재계산에 쓰도록 하려면, 키입력 방위각 위치의 등급을 올려서 기계점과 후시점 간에 결정된 방위각보다 그 서열을 높게 해야 합니다.

팁: 키입력 방위각의 등급은 수정할 수 있습니다.


수평각

 기타

Trimble Geomatics Office는 비 GPS 관측치를 위해서 두 포인트 사이에 무방향 수평각을 저장합니다. 재계산을 하는 동안 각도에 방향이 부여됩니다.

수평각은 가져오기 도중 다음에 의해 결정됩니다:

여기서:

	: Trimble Geomatics Office의 저장 수평각
	: 전시점에 대한 수평 관측치
	: 후시점에 대한 수평 관측치
BSObs 값은 장치 파일의 BKB 레코드에 저장됩니다. (BKB 레코드는 후시 레코드가 가지고 있는 .dc 파일로 되어있는 레코드 형식입니다.)

후방 레코드가 없을 경우 Trimble Geomatics Office는 관측된 첫번째 포인트를 후방 포인트로 간주합니다.


경사 축소
경사 축소 변환

 개요

Trimble Geomatics Office는 재계산 중에 각각의 비 GPS 관측치에 대해 수평 및 수직 구성 요소에 대한 사거리를 축소합니다.

다음의 두 가지 식이 사용됩니다:

여기서:

	: 원본 포인트 표고에서의 수평 거리
	: 원본 포인트와 타겟점 간의 높이차
	: 사거리 (관측 보정 후)
	: 천정 수직각
축소 다이어그램을 참조하십시오. 이 다이어그램은 위의 두 식에서 사용된 값을 명확하게 설명해 줍니다.


타원체 레벨 보정
타원체 면 보정

계산된 수평 거리에는 해수면 보정(또는 타원체 면 보정)을 적용합니다. 해수면 보정이 적용되는지 보려면 [파일 / 프로젝트 등록 정보] / [재계산] 탭을 선택합니다.

이 보정은 수평 거리를 타원체 면(지오이드 면이 아니고 해수면) 기준의 측정 거리로 축소해 줍니다. 축소의 차이는 그렇게 크지 않습니다.

타원체 면 보정의 확인란을 선택했을 경우 로컬 타원체를 따라 비 GPS 관측치가 적용됩니다. 이 확인란을 선택하지 않았을 경우에는 지상을 따라 비 GPS 관측치가 적용됩니다.

타원체 면 보정 식은 다음과 같습니다:

여기서:

	: 지구 반경
축소 다이어그램을 참조하십시오. 이 다이어그램은 위의 두 식에서 사용된 값을 명확하게 설명해 줍니다.

참조: 타원체 면 보정은 축척 계수만의 파일에서 적용되지 않습니다. 축척 계수만의 파일을 가져올 때, Trimble Geomatics Office의 타원체 면 보정 설정은 [로컬 사이트 설정] 대화 상자의 [지상 좌표 이용] 확인란을 선택하지 않는 한 자동적으로 중지됩니다.


지구 반경

Trimble Geomatics Office에서는 프로젝트 위도 및 프로젝트 타원체를 사용하여 지구 반경이 계산됩니다. 프로젝트 위도가 사용자의 프로젝트에 정의되어 있지 않을 경우 30 도의 기본값 프로젝트 위도가 사용됩니다. 예를 들어 WGS-84 타원체상에서 30도의 프로젝트 위도를 가진 지구 반경은6383 480.917입니다.

참조: 비 GPS 관측치를 가져오기 전에 프로젝트 위도를 설정하십시오. 비 GPS 데이터를 가져온 후 프로젝트 위도를 설정하면 새로 계산된 지구 반경을 사용한 타원체 보정, 곡률 및 굴절 보정이 다시 적용되지 않습니다.

프로젝트 위도를 정의하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다. [프로젝트 등록 정보] 대화 상자가 나타납니다.

2.	[좌표계] 탭을 선택합니다.

3.	[로컬 사이트 설정] 상자의 [변경]을 클릭합니다

4.	[프로젝트 위치] 상자에서 프로젝트 위도를 입력합니다.


광파 관측치 - 개요
광파 관측치 − 개요

Trimble Geomatics Office는 광파 측량기로 관측한 포인트를 지원합니다. 이 포인트를 광파 관측치라고 합니다.

Trimble Geomatics Office에서 다음과 같은 작업을 할 수 있습니다:

  광파 관측치 가져오기

  레이저 거리계 관측치 가져오기

  디지털 레벨 파일 가져오기


광파 관측치의 축소
광파 관측치의 축소 변환

Trimble Geomatics Office는 광파 관측된 포인트의 좌표를 계산하기 위하여 거리 측정치와 관측 각도를 사용하여 재계산 작업을 수행합니다.

가져오기

파일 가져오기 도중 다음과 같은 보정이 적용됩니다:

  기압 및 온도 보정(사거리에 적용)

  곡률 및 굴절(수직각에 적용)

  수평각 (수평 관측치를 후시점으로부터의 수평각으로 축소). 반위 읽음값이 정위 읽음값으로 저장됩니다.

  전자 거리 측정기 (EDM) 설치 이심률 보정

  수평 시준

  수직 시준

재계산

재계산 중 다음과 같은 보정이 적용됩니다:

  타원체 보정

  수평 배향

  프리즘 상수


축소 다이어그램

이 보정에 있어서, 다음의 그림은 공식에서 사용된 값을 명확하게 설명해 줍니다.

여기서:

	: 천정 수직각
	: 사거리 (관측 보정 후)
	: 타원체상의 원본 포인트 표고
	: 원본 포인트와 타겟점 간의 높이차
	: 원본 포인트 표고에서의 수평 거리
	: 해수면 (또는 타원체 면) 현
	: 해수면 (타원체) 거리


광파 관측치 - 반위 관측치
광파 관측치 − 반위 관측치

반위 관측치는 정위 관측치로 변환되어 데이터베이스에 저장됩니다. 관측치를 선택하려면 등록 정보 창 을 사용합니다. 정위 또는 반위가 나타납니다.

동일한 포인트를 시점과 종점으로 하는 정위 및 반위 관측치가 있을 경우, 반위와 정위 관측치의 평균값이 계산되어 하나의 관측치로 가져오기가 실행됩니다. 관측치 종류는 '평균'으로 표시됩니다.


광파 관측치 - 트래버스
광파 관측치 − 트래버스

Trimble Survey Controller나 TDS Survey Pro, 3600/5600 Elta 소프트웨어를 이용하여, 광파 관측치에 대한 잘못된 트래버스 폐합 오차를 계산하고 트래버스를 조정할 수 있습니다.

트래버스를 조정한 후 그 조정 값을 변경하고자 할  때에는 다음 과정을 따릅니다.

1.	변경하고자 하는 좌표의 포인트를 선택합니다.

2.	등록 정보 창을 열어서 나무계층 구조를 이용해 포인트를 확장합니다.

3.	이미 이 포인트의 그리드/로컬 좌표가 있는지 확인합니다. 그리드/로컬 좌표가 없을 경우 [좌표 추가] 도구 [image] 를 사용하여 좌표를 추가합니다.

4.	좌표 필드를 클릭하여 알려진 좌표 값을 입력합니다.

5.	좌표 필드 옆에 있는 등급 선택기 제어 (Quality Selector Control)  드롭 다운 목록에서 [등급] 옵션을 선택합니다. 이 등급은 관측치에 우선하여 사용되기 위해서는 측량 등급 또는 그 보다 높은 등급이어야 합니다.

6.	[확인]을 클릭 합니다.

7.	F4 를 눌러 측량 데이터의 재계산을 수행합니다.

알려진 좌표와 관측된 좌표 간의 폐합 오차가 재계산에 의해 결정됩니다.

폐합 오차는 재계산 보고서에서 볼 수 있습니다. 이 폐합 오차를 보지 않으려면 관측치를 이용 해제 합니다.

폐합 오차를 보려면 다음 중의 한가지를 실행합니다:

  [보고서 / 재계산 보고서]를 선택합니다.

  등록 정보 창의 [경고 페이지] 단추 [image] 를 클릭합니다. 그리고 [포인트 도출] 도구 [image] 을 클릭합니다.

  등록 정보 창의 [요약 페이지] 단추 [image] 를 클릭합니다. 그리고 [포인트 도출] 도구 [image] 을 클릭합니다.


레이저 거리계 (Rangefinder) 관측치 - 개요
레이저 거리계 관측치 − 개요

Trimble Geomatics Office는 Trimble Survey Controller 7.0 이상의 버전을 가진 레이저 거리계로 관측한 포인트를 지원합니다. Trimble Survey Controller가 지원하는 레이저 거리계에 대한 정보는 Trimble Survey Controller 참고 매뉴얼을 보십시오.

레이저 거리계 관측치가 표시되는 방법은 등록 정보 창의 모양 설정에 따라 달라집니다.

Trimble Geomatics Office에서 다음과 같은 작업을 할 수 있습니다:

  레이저 거리계 관측치를 포함하고 있는 Survey Controller (*.dc) 파일 가져오기 (Trimble Geomatics Office는 관측된 레이저 거리계 포인트를 광파 포인트와 같은 방법의 가져오기를  실행합니다.)

 등록 정보 창에서 레이저 거리계 관측치 보기

  레이저 거리계 관측치의 선택 및 보고서 작업


레이저 거리계 관측치 - 보기
    레이저 거리계 관측치 − 보기

레이저 거리계 관측치는 '측량 보기'에서 표시됩니다. 표시되는 색상은 [보기 / 옵션] / [측량 범례] 탭에서 정한 배경 설정에 따라 달라집니다.

팁: [선택 / 질의 기준]을 선택하고 '레이저 거리계 포인트' 옵션을 사용하여  데이터베이스의 모든 레이저 거리계 포인트를 선택하십시오. 레이저 거리계 포인터는 레이저 거리계 관측치를 가지고 있습니다.

레이저 거리계를 사용하여 관찰한 포인트를 보려면:

1.	'측량 보기'에서 등록 정보 창을 엽니다.

2.	레이저 거리계 관측치를 선택합니다.

다음과 같은 레이저 거리계 관측치 내역을 보려면 [메뉴] 단추를 사용합니다:


캘리브레이션 및 조정 변환 매개 변수

방법...

데이터베이스의 WGS-84 포인트 (GPS 점) 와 로컬 그리드점 간의 관계를 설정해주는 캘리브레이션 매개 변수가 GPS 사이트 캘리브레이션을 수행할 때 계산됩니다.

변환 매개 변수는 제약 망 조정(망 조정 모듈이 설치되어 있을 경우)이 수행될 때 계산됩니다. 이 매개 변수는 관측치와 고정 기준점 간의 관계를 설정해 줍니다.

Trimble Geomatics Office는 GPS 사이트 캘리브레이션에서 생성된 수평 및 수직 조정 매개 변수나 캘리브레이션 조정 후 얻어진 조정 변환 매개 변수 중 한가지만을 허용합니다. 조정을 수행하여 조정 변환 매개 변수를 계산한 후 GPS 사이트 캘리브레이션을 수행하려고 시도할 경우 캘리브레이션을 계속하면 매개 변수가 삭제될 것이라는 경고가 나타날 것입니다.

참조: 조정으로 생성된 조정 변환 매개 변수를 Trimble Survey Controller로 전송할 수 없습니다. 이것을 하려면 WGS 데이텀 상의 조정으로 얻어진 저장된 캘리브레이션 좌표 (WGS-84 포인트로서) 와 로컬 데이텀 상의 제약 망 조정으로 얻어진 (그리드 포인트로서) 조정 좌표를 사용하여 GPS 사이트 캘리브레이션을 수행하여야 합니다.


참고 문헌

책

Barry, B. Austin. 1991. Errors in Practical Measurement in Surveying, Engineering, and Technology. Edited by M. D. Morris. ISBN�0-910845-47-6. Rancho Cordova: Landmark Enterprises.

Hofmann-Wellenhof, B., Herbert Lichtenegger, and James Collins. 1993. Global Positioning System Theory and Practice. Second Edition. ISBN:�3-211-82477-4 and ISBN�0-387-82477-4. New York: Springer-Verlag Wien.

Leick, Alfred. 1995. GPS Satellite Surveying. Second Edition. ISBN: 0-471-30626-6. New York: John Wiley and Sons, Inc.

Pope, Allen J. 1976. The Statistics of Residuals and the Detection of Outliers. NOAA Technical Report NOS65 NGS1, Rockville, MD.

Seeber, G�nter. 1993. Satellite Geodesy, Foundations, Methods, and Applications. ISBN:�3-11-012753-9. Berlin and New쟛ork: Walter deGruyter.

U.S. National Geodetic Survey (NGS). 1986. Geodetic Glossary. Silver Spring, MD: NGS Publications Information Center.

Van쟔ickle, Jan. 1996. GPS for Land Surveyors. ISBN 1-575-04041-7. Ann잸rbor: Ann잸rbor Press, Inc.

Wolf, Paul R. and Charles D. Ghilani. 1997. Adjustment Computations: Statistics and Least Squares in Surveying and GIS. ISBN: 0471-16833-5. New York: John Wiley and Sons, Inc.

기타 � 미국의 출판물 / 정기 간행물

다음의 출판물은 토목 공학이나 측량 관련 분야에서의 유용한 정보원입니다.

ACSM Bulletin. ISSN: 0747-9417. Published bimonthly by the American Congress on Surveying and Mapping, 5410 Grosvenor Land, Suite 100, Bethesda, MD 20814-2144 USA.

GPS World: News and Applications of the Global Positioning System. ISSN: 1048-5104.Published monthly by Advanstar Communications Inc. Subscription offices: P.O. Box 6148, Duluth, MN 55806-6148 USA.

P.O.B. - Point of Beginning. ISSN: 0739-3865. Published monthly by Business News Publishing Company, 755 W. Big Beaver Road, Ste. 1000, Troy, MI 48084 USA.

Professional Surveyor. ISSN: 0278-1425. Published ten times a year by Professional Surveyors Publishing Company, Inc., 1713-J Rosemont Avenue, Frederick, MD 21702-4170 USA.


줌 내비게이터

줌 내비게이터(Zoom Navigator)는 프로젝트 표시줄의 하단에 있는 작은 창입니다. 이것은 Trimble Geomatics Office의 메인 그래픽 창에 표시되는 데이터를 보여줍니다. 메인 윈도우에서 어떤 축소/확대 도구를 쓰면 그에 따라 줌 내비게이터도 바뀝니다. 줌 내비게이터는 항상 프로젝트의 전체 범위를 표시합니다.

줌 내비게이터 숨기기/표시하기

Trimble Geomatics Office의 프로젝트 표시줄에서 줌 내비게이터를 숨기거나 표시하려면,

1.	프로젝트 표시줄에서 마우스의 오른쪽 단추를 누릅니다.

바로 가기 메뉴가 나옵니다.

2.	[줌 내비게이터]를 선택합니다.

줌 내비게이터 사용하기

줌 내비게이터를 사용하려면,

  줌 내비게이터에서 프로젝트의 어떤 지점을 클릭합니다.

참조: 그러면 이 지점이 메인 그래픽 창의 중심이 됩니다.

줌 내비게이터를 이용하여 축소/확대를 하려면,

1.	줌 내비게이터의 어떤 영역을 네모 모양으로 드래그 합니다.

동일한 데이터가 메인 그래픽 창에 표시됩니다.

2.	이 네모 상자의 가운데로 마우스를 가져가면 포인터가 [image] 로 바뀝니다. 이것은 축소/확대 상태를 변경함이 없이 이 네모 상자를 프로젝트 영역으로 드래그 할 수 있다는 의미입니다. 메인 그래픽 창의 프로젝트 화면에 이 움직임이 반영됩니다.

  프로젝트의 전체 범위를 보려면 마우스를 줌 내비게이터에서 더블 클릭합니다.

참조: 휠이 있는 마우스는 그 휠을 이용하여 줌 내비게이터 상자의 크기를 조절할 수 있습니다.


프로젝트 표시줄 - 개요
프로젝트 표시줄 − 개요

프로젝트 표시줄은 몇 개의 그룹으로 구성되는데, 각 그룹은 Trimble Geomatics Office에서 흔히 쓰는 작업들이 바로 가기 형식으로 목록화 되어 있습니다.

작업을 신속히 실행하려면,

1.	프로젝트 표시줄에서 원하는 바로 가기를 누릅니다.

2.	해당 그룹을 눌러 원하는 바로 가기를 찾아갑니다.

바로 가기 아이콘의 크기를 조정하려면,

1.	프로젝트 표시줄의 어떤 지점에서 마우스의 오른쪽 단추를 누릅니다.

바로 가기 메뉴가 나타납니다.

2.	큰 아이콘 옵션이나 작은 아이콘 옵션을 선택합니다.

프로젝트 표시줄을 숨기거나 표시하려면 다음 중 한 방법을 이용합니다.

  프로젝트 표시줄의 어떤 지점에서 마우스의 오른쪽 단추를 누릅니다.

바로 가기 메뉴가 나오면 [숨기기]를 선택합니다.

  [보기 / 프로젝트 표시줄]을 선택합니다.

도구 모음에서 프로젝트 표시줄 아이콘을 누릅니다.

열려 있는 프로젝트가 없는 경우에는 프로젝트 그룹과 유틸리티 그룹만 이용할 수 있지만, 열려 있는 프로젝트가 있으면 유틸리티 그룹을 제외한 전 그룹을 이용할 수 있습니다.

  Trimble Survey 그룹

  프로젝트 그룹

  가져오기 그룹

  처리 그룹 (Trimble WAVE Baseline Processing 모듈이 설치된 경우)

  조정 그룹 (Trimble Network Adjustment 모듈이 설치된 경우)

  내보내기 그룹

  CAD 그룹

  유틸리티 그룹


프로젝트 표시줄 - Trimble Survey 그룹
프로젝트 표시줄 − Trimble Survey 그룹

이 그룹에는 '측량 보기' 옵션 하에서의 주요 작업에 대한 바로 가기가 들어 있습니다. 이 바로 가기 명령 항목은 많이 쓰이는 순서대로 나열됩니다.


프로젝트 표시줄 - 프로젝트 그룹
프로젝트 표시줄 − 프로젝트 그룹

이 그룹에는 프로젝트 명령의 바로 가기가 들어 있습니다.


프로젝트 표시줄 - 가져오기 그룹
프로젝트 표시줄 − 가져오기 그룹

이 그룹에는 주요 측량 데이터 출처로부터의 가져오기 작업에 대한 바로 가기가 들어 있습니다.


프로젝트 표시줄 - 처리 그룹
프로젝트 표시줄 − 처리 그룹

이 그룹에는 주요 기선 처리 작업에 대한 바로 가기가 들어 있습니다.

참조: Baseline Processing 모듈이 설치되어 있어야 합니다.


프로젝트 표시줄 - 조정 그룹
프로젝트 표시줄 − 조정 그룹

이 그룹에는 주요 망 조정 작업에 대한 바로 가기가 들어 있습니다.

참조: Network Adjustment 모듈이 설치되어 있어야 합니다.


프로젝트 표시줄 - 내보내기 그룹
프로젝트 표시줄 − 내보내기 그룹

이 그룹에는 프로젝트 데이터를 주요 데이터 포맷으로 내보내는 작업에 대한 바로 가기가 들어 있습니다.


프로젝트 표시줄 - CAD 그룹
프로젝트 표시줄 − CAD 그룹

이 그룹에는 '평면도 보기' 옵션 하에서의 주요 작업에 대한 바로 가기가 들어 있습니다.


프로젝트 표시줄 - 유틸리티 그룹
프로젝트 표시줄 − 유틸리티 그룹

이 그룹에는 Trimble Geomatics Office 시스템에 포함된 주요 유틸리티의 바로 가기가 들어 있습니다.


속성 - 개요
속성 − 개요

추가 정보

방법 ...	대화 상자	기타
개요

속성은 피쳐 코드에 대한 서술적 정보를 말합니다. 피쳐 코드 '나무'의 속성으로는 수종, 높이, 둘레, 상태 등을 들 수 있습니다. 작업 현장에서 수집하는 각각의 나무 피쳐는 자신만의 고유한 속성 값이 있습니다.

Trimble Geomatics Office는 속성 정보의 관리 기능을 지원합니다. Trimble Geomatics Office로써 할 수 있는 작업:

 Trimble Feature and Attribute Editor 유틸리티를 이용하여 속성 정의가 들어 있는 피쳐 및 속성 라이브러리 만들기

 속성이 들어 있는 Survey Controller (*.dc) 파일 가져오기

 속성 정보의 보기 및 편집

 속성의 추가

 지리 정보 시스템(GIS) 포맷으로의 데이터 내보내기

 속성 보고서 만들기

Feature and Attribute Editor 유틸리티를 이용함으로써 피쳐 코드에 대한 일단의 속성을 정의할 수 있습니다. 각 속성에 대하여는 그 이름과 형식을 정의하여야 합니다. 속성 형식은 그 속성 정보의 포맷을 결정하게 됩니다. 예를 들어, '나무'에 대한 '높이' 속성의 경우, 그 속성 형식은 '수치'입니다.

데이터 딕셔너리 (*.ddf) 파일을 이용하여 속성 정보를 수집할 수도 있습니다. .ddf 파일을 만들려면 Trimble의 Data Dictionary Editor를 이용하는데, 이것은 GPS Pathfinder�  Office 소프트웨어의 한 유틸리티입니다.

작업 절차

Trimble Geomatics Office에서 속성 정보 관리 작업의 절차:

1.	Feature and Attribute Editor에서 피쳐 및 속성 라이브러리 (*.fcl) 파일을 만듭니다.

2.	Trimble Geomatics Office에서 .fcl 파일이나.ddf 파일을 선택함으로써 속성 이용을 위한 프로젝트 구성을 합니다.

3.	그 .fcl 파일이나.ddf 파일을 Trimble Survey Controller(버전 7.00 이상)로 전송합니다.

4.	현장에서 데이터를 수집합니다.

5.	현장 데이터를 Trimble Geomatics Office로 전송합니다.

6.	이 데이터를 GIS포맷이나 사용자 ASCII 포맷에로 내보냅니다.


피쳐 및 속성 라이브러리 - 개요
피쳐 및 속성 라이브러리 − 개요

추가 정보

 방법 ...

개요

피쳐 및 속성 라이브러리 파일(*.fcl)은 피쳐 코드와 속성, CAD 스타일, 제어 코드의 정의가 들어 있는 텍스트 파일입니다. 피쳐 및 속성 라이브러리의 편집은 Trimble의 Feature and Attribute Editor 유틸리티를 이용합니다.

피쳐 및 속성 라이브러리는 피쳐 코드의 처리시 수행할 작업을 설명하는 명령문들로 구성됩니다. 수행 작업의 실례:

  포인트에 특정 심벌 스타일을 지정

  포인트 사이의 선 만들기

  현장에서 수집할 속성의 정의

  포인트와 선의 주석 달기

피쳐 및 속성 라이브러리의 만들기에 대한 자세한 사항은 Trimble Feature and Attribute Editor 온라인 도움말을 참조하십시오.

피쳐 및 속성 라이브러리 파일(*.fcl)은 다음과 같은 작업에 이용됩니다.

  피쳐 코드 처리

  현장에서 데이터를 수집하기 위한 속성 정의

피쳐 코드 처리

피쳐 및 속성 라이브러리를 피쳐 코드의 처리 작업에 이용하는 것과 관련, 보다 자세한 사항은 피쳐 코드 ㅡ 개요 항목을 참조합니다.

속성

속성 이용을 위한 프로젝트 구성을 하려면 [프로젝트 등록 정보] 대화 상자를 이용합니다. 피쳐 및 속성 라이브러리 (*.fcl) 파일이나 데이터 딕셔너리 (*ddf) 파일을 선택할 수 있습니다.


속성 이용을 위한 프로젝트 구성하기

 개요 및 추가 정보

Trimble Geomatics Office에서 속성을 이용하려면 반드시 이를 위한 프로젝트 구성을 하여야 합니다. 프로젝트를 구성하려면 이용하고자 하는 피쳐 및 속성 라이브러리(*.fcl) 파일이나 데이터 딕셔너리 (*.ddf) 파일을 선택합니다.

팁: .fcl 파일이나 .ddf파일의 선택 방법에 대한 자세한 사항은 속성 이용을 위한 프로젝트 구성하기 항목을 참조합니다.

Trimble Geomatics Office는 속성이 있는 각 피쳐 코드에 대하여 테이블을 만듭니다. 라이브러리 파일은 해당 프로젝트에 저장되지 않습니다. 이는 라이브러리를 변경하더라도 그 프로젝트가 업데이트 되지 않는다는 것을 의미합니다.

프로젝트의 피쳐 및 속성 라이브러리 변경

프로젝트의 피쳐 및 속성 라이브러리를 변경하려면 위에서 설명한 대로 라이브러리를 선택하면 됩니다. 그러나 다음과 같은 작업 다음에는 이 변경 작업이 가능하지 않습니다.

  속성이 들어 있는 Survey Controller (*.dc) 파일 가져오기

  Trimble Geomatics Office에서 속성 레코드 추가

그 이유는 기존의 피쳐 테이블이 삭제되고, 선택한 라이브러리로써 새 테이블이 만들어지기 때문입니다.

프로젝트의 피쳐 및 속성 라이브러리를 꼭 변경해야 할 필요가 있을 경우에는 속성과 함께 모든 포인트를 삭제한 다음, 그 프로젝트를 다시 불러와서 새 라이브러리를 선택하면 됩니다.

Trimble Survey Controller

Trimble Geomatics Office에서 쓰는 피쳐 및 속성 라이브러리나 데이터 딕셔너리 파일은 현장의 Trimble Survey Controller에서 이용하는 것과 동일하여야 합니다. 이용하는 라이브러리가 서로 다르면 일부 속성을 가져오지 못할 수 있습니다.

라이브러리가 서로 다를 경우의 속성 데이터 가져오기와 관련, 보다 자세한 사항은 정의가 다른 속성 가져오기를 참조하십시오.


데이터 딕셔너리 파일 - 개요
데이터 딕셔너리 파일 − 개요

추가 정보

 기타

개요

데이터 딕셔너리 파일은 피쳐와 그 관련 속성을 정의하는 파일입니다.

이것은 피쳐 및 속성 라이브러리 파일 대신 쓸 수 있는 파일입니다.

Data Dictionary Editor 유틸리티(GPS Pathfinder Office의 구성 유틸리티)가 있다면 이것을 이용하여 데이터 딕셔너리 (*.ddf) 파일을 만들 수 있습니다. .ddf 파일에는 피쳐 및 속성 정의가 들어 있습니다.

.ddf 파일로써 속성 이용을 위한 프로젝트 구성

.ddf 파일을 써서 속성 이용을 위한 Trimble Geomatics Office 프로젝트 구성을 할 수 있습니다. 이 경우, .ddf 파일의 선이나 영역 피쳐는 모두 포인트 피쳐로 취급되게 됩니다. 그 이유는 Trimble Geomatics Office와 Trimble Survey Controller(버전 7.00 이상)가 포인트 피쳐만 지원하기 때문입니다.

Feature and Attribute Editor에서 .ddf 파일의 이용

참조: 속성 이용을 위한 프로젝트 구성에 쓰는 피쳐 및 속성 라이브러리는 피쳐 코드 처리에 쓰이는 피쳐 및 속성 라이브러리와 같은 것일 필요가 없습니다. 하지만 피쳐 및 속성 라이브러리 파일을 이용하여 현장에서 속성 데이터를 수집하는 경우에는 동일한 파일로써 피쳐 코드를 처리하도록 합니다.

Feature and Attribute Editor 유틸리티를 이용하면 .ddf 파일을 피쳐 및 속성 라이브러리 (*.fcl) 파일로 가져올 수 있습니다. 또한 .fcl 파일을.ddf 파일로 내보낼 수도 있는데, 이런 작업은 Data Dictionary Editor 유틸리티로써 .ddf 파일을 이용하고자 하는 경우, 유용합니다.

Trimble Survey Controller에서 .ddf 파일의 이용

.ddf 파일을 현장에서 속성 정의 라이브러리로 이용할 수 있습니다. Trimble Survey Controller에 .ddf 파일을 전송하면 됩니다.


정의가 다른 속성 가져오기

 개요 및 기타 정보

속성이 있는 Survey Controller (*.dc) 파일의 가져오기를 할 때, 그 .dc 파일의 속성 정의는 프로젝트의 속성 정의와 상호 비교됩니다. 그 결과, 어떤 면에서든 다른 점이 보이면 대화 상자가 나타나게 되는데, 이 때 사용자가 다음의 사항을 결정하게 됩니다.

  피쳐 및 속성 라이브러리와 데이터 딕셔너리 파일에 공통되는 속성 정보의 가져오기 여부

프로젝트의 피쳐 및 속성 라이브러리 파일을 Trimble Survey Controller에 전송한 다음 그 파일에 있는 속성 정의를 변경한 경우에 이 옵션을 선택하면, 그 피쳐 코드에 대한 속성 정보가 유실되게 됩니다. 새 피쳐 코드를 추가한 경우에만 데이터가 유실되지 않습니다.

  피쳐 코드는 있지만 속성 정보가 없는 포인트의 삽입 여부

  가져오기의 취소 여부

이 메시지가 나타나는 것을 방지하려면, Trimble Survey Controller에서 쓰는 파일과 같은 것을 속성 이용을 위한 프로젝트 구성에 이용하도록 합니다.


Trimble Geomatics Office 소프트웨어에서 속성의 보기/편집하기
Trimble Geomatics Office에서 속성의 보기/편집하기

 개요 및 기타 정보

Trimble Geomatics Office에서 어떤 포인트의 속성을 보거나 편집하고자 하면 등록 정보 창을 이용합니다. [프로젝트 등록 정보] 대화 상자에서 속성 이용을 위한 프로젝트 구성을 하였다면 [속성] 탭이 등록 정보 창에 나타납니다. 선택된 포인트에 속성이 있는 피쳐가 2개 이상 있을 경우, 보고자 하는 속성에 대한 피쳐를 드롭 다운 목록에서 선택합니다. 속성 값을 수정하려면 '값' 열에 있는 해당 필드를 클릭합니다.

메뉴 속성의 경우에는,

  속성 값의 목록에서 값을 하나 선택합니다.

기타 다른 모든 속성 형식에서는,

  키보드로써 새로운 속성 값을 입력합니다. 속성에 대하여는 필드 필인(Fill-in) 기능을 이용할 수 없습니다.

참조: 속성 정보의 수정시, Trimble Geomatics Office는 그 피쳐 및 속성 라이브러리의 정의 내용을 체크하여, 새로 입력된 값이 올바른 것인지 확인합니다.


속성이 있는 포인트를 프로젝트간 복사하기/잘라내기/붙여넣기

 기타

속성이 있는 포인트의 복사, 잘라내기, 붙여넣기를 하려면 그 두 프로젝트의 구성에 이용한 피쳐 및 속성 라이브러리가 동일하여야 합니다.

그 피쳐 및 속성 라이브러리는 서로 다르지만 공통되는 속성 정의가 있다면, 경고 메시지가 나오는데 이 때 사용자는 1)붙여넣기 취소, 2)포인트만 붙여넣기(속성 없이), 3)두 라이브러리의 공통 속성과 함께 포인트 붙여넣기 등의 옵션을 선택할 수 있습니다. 붙여넣기가 이루어지지 않은 속성은 Import.rpt 보고서에 기록됩니다.

속성이 있는 포인트가 이미 프로젝트에 있을 경우, 속성 이용을 위한 프로젝트 구성을 하고자 다른 라이브러리를 선택할 수 없습니다. 이는 속성 정의가 이미 설정되어 있기 때문입니다. 하지만 새 프로젝트를 만들어 피쳐 및 속성 라이브러리(또는 데이터 딕셔너리 파일)에서 속성 정의를 새로 한 다음, 기존 프로젝트로부터 새 프로젝트로 속성과 더불어 포인트를 복사할 수 있습니다.

참조: 복사/잘라내기 후의 붙여넣기가 가능하려면 다음 중 한 경우여야 합니다.

  복사하거나 잘라내는 모든 포인트에 표고가 있는 경우

  기본값 표고가 프로젝트에 명시되어 있는 경우. 이 기본값은 표고가 공백값인 포인트에 적용됩니다.

이것은 복사하거나 잘라내는 원본 포인트의 좌표가 WGS-84 타원체로 축소 변환되기 때문입니다. 붙여넣은 포인트에는 붙여넣기의 대상 프로젝트에 있는 좌표계가 적용되는데, 만일 이 대상 프로젝트의 좌표계가 다른 것이라면 그 정확한 좌표가 표시되게 됩니다.


FCL 파일과 DDF 파일의 차이점
.fcl 파일과 .ddf 파일의 차이점

Trimble Geomatics Office 프로젝트에는 피쳐 및 속성 라이브러리 (*.fcl) 파일이나 데이터 딕셔너리 (*.ddf) 파일을 쓸 수 있습니다. 현재 작업 중인 프로젝트에 대한 파일을 선택하려면 [파일 / 프로젝트 등록 정보]에서 [일반] 탭을 선택합니다. 아래에서는 이 두 파일의 차이점을 설명합니다.

.fcl 파일

.fcl 파일에는 CAD 설정(예: 포인트 스타일, 선 스타일, 주석 스타일, 제어 코드)이 들어 있을 수 있는데, 이 설정은 속성 정의 뿐만 아니라 피쳐 코딩을 위한 것입니다. 속성 이용을 위한 프로젝트 구성에 쓸 .fcl 파일을 선택할 때, Trimble Geomatics Office는 이 속성 정의를 이용하여 필요한 테이블을 만듭니다.

속성이 있는 .fcl 파일을 Trimble Survey Controller(버전 7.00 이상)에 내보내는 경우에도 이와 동일한 과정이 진행됩니다.

피쳐 코드를 이용하여 속성을 수집하고자 하면 .fcl 파일을 이용하면 됩니다. 이미 .ddf 파일이 있지만 피쳐 코딩을 하고자 하는 경우에는 Feature and Attribute Editor에서 그 .ddf 파일을 .fcl 파일로 가져온 다음, 이를 이용할 수 있습니다.

자세한 사항은 Feature and Attribute Editor 도움말을 참조하십시오.

.ddf 파일

.ddf 파일에는 피쳐 코딩을 위한 CAD 설정이 포함될 수 없고, 피쳐 및 속성 정의만 들어 있습니다. 따라서 .ddf 파일로부터 피쳐 코드를 처리하는 경우, 포인트 스타일이나 선 스타일, 주석 스타일은 전혀 지정되지 않게 됩니다.

.ddf 파일은 Data Dictionary Editor 유틸리티(GPS Pathfinder Office의 경우)나 Feature and Attribute Editor(Trimble Geomatics Office의 경우)로부터 만들 수 있습니다. (.ddf 파일을 내보내려면 Feature and Attribute Editor의 [파일 / 내보내기]를 선택합니다.)


Data Transfer - 개요
Data Transfer − 개요

Trimble의 Data Transfer 유틸리티는 Trimble Geomatics Office와 어떤 장치(Survey Controller, Trimble GPS 수신기, 광파식 토탈 스테이션, SDR 포맷 데이터 컬렉터, 디지털 레벨, 제어 유니트, PC 카드) 사이에 데이터를 전송하기 위한 소프트웨어입니다. Data Transfer 유틸리티로써 데이터 전송을 하기에 앞서, 필요한 장치를 먼저 설정하여야 합니다.

Trimble Geomatics Office에서 Data Transfer 유틸리티를 이용하는 방법은 다음과 같습니다.

1.	[파일 / 가져오기] 명령이나 [파일 / 내보내기] 명령을 실행합니다. 해당 대화 상자가 나옵니다.

2.	필요한 옵션을 선택합니다.

Data Transfer 유틸리티를 불러오려면 어떤 장치로의 연결이 필요한 옵션을 선택합니다.

상황에 따라 [다른 이름으로 저장] 대화 상자나 [열기] 대화 상자가 나옵니다.

3.	데이터를 송수신할 장치를 선택합니다.

프로젝트를 통하지 않고 Data Transfer 유틸리티 이용하기

작업 중인 프로젝트가 없는 경우에도 사용자의 컴퓨터와 장치 사이에 파일을 전송할 수 있습니다.

방법:

  Trimble Geomatics Office에서 [유틸리티 / Data Transfer] 명령을 선택합니다.

Trimble Geomatics Office를 통하지 않고 Data Transfer 유틸리티 이용하기

Trimble Geomatics Office를 통하지 않고도 사용자의 컴퓨터로부터 어떤 장치로 파일을 전송할 수 있습니다.

방법:

  [시작 / 프로그램 / Data Transfer]를 선택합니다.


장치 - 개요
장치 − 개요

어떤 장치와 Trimble Geomatics Office 프로젝트 사이의 데이터 전송을 위해서는 해당 장치를 올바르게 설정하여야 합니다.

일단 설정된 장치는 내보내기나 가져오기 작업시 항상 이용할 수 있습니다. 자세한 사항은 Data Transfer 유틸리티 도움말을 참조하십시오.


[DAT 체크인] 대화 상자

GPS 관측치를 Trimble Geomatics Office 프로젝트에 가져오기 전에 그 GPS 파일에 있는 값들을 확인, 보정하려면 이 대화 상자를 이용합니다.

참조: 이 대화 상자에서의 변경 사항은 가져오는 데이터에만 영향을 미칩니다. GPS 데이터 (*.dat) 파일에는 영향을 미치지 않습니다.

이 대화 상자는 다음과 같은 파일의 가져오기를 할 때 나옵니다.

  GPS 데이터 파일 (*.dat)

  RINEX 파일 (*.XXo, *.XXn, *.obs, *.nav)

  관련 .dat 파일이 있는 DC 파일

사용

데이터를 프로젝트로 전송하지 않으려면 이 확인란을 선택 해제합니다.

이름

데이터를 관측한 포인트의 이름이 표시됩니다. 이 포인트에 지정된 이름이 파일에 없을 경우에는 해당 스테이션 ID가 대신 이용됩니다. 이 필드를 변경하고자 하면 키보드로써 이름을 하나 입력합니다.

파일 이름

해당 데이터의 파일 출처가 표시됩니다.

시작 시간

해당 선점의 시작 시간과 날짜가 표시됩니다.

정지 시간

해당 선점의 정지 시간과 날짜가 표시됩니다.

수신기 종류

데이터의 수집에 이용한 GPS 수신기의 종류가 나옵니다.

수신기 S/N

수신기의 일련 번호가 표시됩니다. 이 번호는 수정할 수 있습니다.

안테나 높이

해당 선점에 입력된 안테나 높이가 표시됩니다. 높이가 부정확하게 입력되었다면 키보드를 이용하여 이 필드에 올바른 값을 입력합니다.

안테나 종류

수신기에 연결된 안테나의 종류가 표시됩니다. 안테나가 부정확하게 입력되었다면 목록에서 올바른 종류를 선택함으로써 이 필드를 정정합니다.

높이 지점

안테나의 측정 높이가 어느 지점까지인지를 나타내는 필드입니다. 그 방법이 부정확하게 입력되었다면 목록에서 올바른 옵션을 선택함으로써 이 필드를 정정합니다.

피쳐 코드

해당 포인트에 지정된 피쳐 코드 값이 표시됩니다. 이 필드를 변경하고자 하면 키보드를 이용하여 새 값을 입력합니다.

리셋

원래의 설정 내용을 복원하고자 하면 [리셋] 단추를 누릅니다.

팁: 2개 이상의 포인트에 동일한 변경을 적용하고자 하면 Ctrl키를 누른 상태에서, 변경하고자 하는 열의 필드를 선택합니다. 또한 연속하여 행을 선택하려면 Shift키를 누릅니다. 그 다음, 이 선택 부분의 모든 필드에 적용하고자 하는 값을 입력하거나 선택합니다.


[디지털 레벨 가져오기] 대화 상자

 기타

이 대화 상자를 이용하여,

  디지털 레벨 파일로부터의 데이터를 표시합니다.

  어느 포인트간의 델타 표고를 계산할지 결정합니다.

  시점의 표고가 올바른지 확인합니다.

  기지점들의 폐합차를 결정합니다.

  포인트 이름이 올바른지 확인합니다.

이 대화 상자는 디지털 레벨 파일(*.dat, *.raw)의 가져오기를 할 때 나옵니다. 불러오는 방법은,

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '디지털 레벨 파일(*.dat, *.raw)'을 선택하면 [열기] 대화 상자가 나옵니다.

3.	해당 디지털 레벨 파일을 선택합니다.

4.	[디지털 레벨 가져오기] 대화 상자가 나옵니다.

이 대화 상자에서의 변경 내용은 가져오는 데이터에만 영향을 미칩니다. 디지털 레벨 (*.dat, *.raw) 파일에는 영향을 미치지 않습니다.

참조: 디지털 레벨 데이터를 가져올 때 중복 포인트의 처리 방법을 정할 수 있습니다. Trimble Geomatics Office는 가져오기시 이름이 같은 포인트를 병합하므로(기본값임) 중복 포인트가 생기지 않습니다. [중복 포인트 옵션] 대화 상자에서 [허용 편차 이내의 중복 포인트 병합] 옵션을 써서 중복 포인트의 병합 기준이 될 수직 허용 편차를 설정합니다. 수평 허용 편차는 디지털 레벨 데이터의 가져오기시 이용되지 않습니다.

참조: DiNi 디지털 레벨 장치로부터 데이터를 직접 가져올 수 있습니다. 이 경우, [디지털 레벨 가져오기] 대화 상자가 나옵니다.

팁: 디지털 레벨 가져오기 데이터를 수집할 때, Trimble Geomatics Office에 가져오고자 하는 포인트에 접두어나 접미어를 특유하게 붙여 저장합니다. 예를 들어, 스테이션 포인트로 이용하고자 하는 포인트는 모두 접두어 STN을 붙여 저장한다면 [디지털 레벨 가져오기] 대화 상자에서 [필터 기준 선택] 단추를 이용하여 손쉽게 선택할 수 있게 됩니다.

[표고] 상자에는 다음과 같은 필드가 있습니다.

시점

시점의 이름. 레벨 런(Level run)에서 시점은 시점 아이콘으로써 표시됩니다.

표고

시점의 표고. 테이블에서 포인트를 선택할 때 시점의 표고를 수정할 수 있습니다. 테이블에서 다른 레벨 루프를 선택하면 그 루프의 시점이 [표고] 상자에 나타납니다. 어떤 레벨 루프의 끝과 또 다른 루프의 시작은 테이블에서 검정 색의 두꺼운 수평선으로 표시됩니다.

표고의 질

표고의 질을 변경하려면 [질] 단추를 누릅니다.

디지털 레벨 테이블의 데이터는 관측을 한 순서대로 나옵니다. 다음과 같은 열이 있습니다.

열	표시 내용
스테이션 포인트	포인트 이름 및 Trimble Geomatics Office에 가져올 스테이션 포인트로 선택되었는지 여부. 파일을 가져올 때, 모든 관측치가 선택됩니다(기본값). 스테이션 포인트의 이름은 수정할 수 있습니다.
BS	레벨 후시(Backsight) 관측치
IS	레벨 중간시(Intermediate sight) 관측치. 대응하는 후시를 선택하기 전에는 중간시를 선택할 수 없습니다.
FS	레벨 전시(Foresight) 관측치
표고	포인트의 표고. 표고 계산의 시점으로 어느 포인트가 사용되었는지 나타내는 아이콘이 있습니다. 이것은 [표고] 상자에 나오는 시점과 일치합니다.  각 루프의 시점 표고는 [표고] 상자에서 수정할 수 있습니다. 어떤 포인트의 표고가 없을 경우, 그 포인트의 표고를 계산하기 위한 시점이 선택되지 않습니다.
거리	후시나 전시, 중간시의 거리
설명	레벨 측량 중인 포인트에 대한 설명
측설 델타	측설한 포인트와 그 설계고와의 표고 차이

테이블의 포인트는 다음 중 한 방법으로 선택합니다.

  '스테이션 포인트' 열의 확인란을 선택합니다.

  '스테이션 포인트' 열의 표제를 클릭합니다. 이 열의 상단을 클릭하고 나서 그 첫번째 포인트를 선택하면 테이블의 모든 포인트를 선택할 수 있습니다.

  [필터 기준 선택]을 클릭합니다.

일단 선택 부분을 정하면 다음의 규칙이 적용됩니다.

  선행하는 후시를 선택하기 전에는 중간시를 선택할 수 없습니다.

  이름이 같은 전시/후시/중간시가 둘 이상 있을 경우, 동일한 이름의 관측치를 모두(중간시 제외) 선택하게 됩니다.

[필터 기준 선택]을 클릭하면 [레벨 스테이션 정의] 대화 상자가 나옵니다.

참조: 지원되는 디지털 레벨 라인 및 저장 포맷은 다음과  같습니다.

참조: Trimble Geomatics Office는 레벨 런의 범위(330개 레코드) 밖에 기록된 Leica 측정 레코드를 지원하지 않습니다.


[레벨 스테이션 정의] 대화 상자

추가 정보

 기타

이 대화 상자는 [디지털 레벨 가져오기] 대화 상자에서 [필터 기준 선택]을 클릭할 때 나옵니다. 이 필터 옵션을 이용하여 스테이션 포인트를 선택하거나 선택 해제합니다. 모든 스테이션 포인트가 [디지털 레벨 가져오기] 대화 상자에서 선택됩니다(기본값임).

팁: 디지털 레벨 가져오기 데이터를 수집할 때, Trimble Geomatics Office에 가져오고자 하는 포인트에 접두어나 접미어를 특유하게 붙여 저장합니다. 예를 들어, 스테이션 포인트로 이용하고자 하는 포인트는 모두 접두어 STN을 붙여 저장한다면 [디지털 레벨 가져오기] 대화 상자 에서 [필터 기준 선택] 단추를 이용하여 손쉽게 선택할 수 있게 됩니다.

옵션:

다음 조건의 포인트 선택

이 옵션을 이용하여 [디지털 레벨 가져오기] 대화 상자의 '스테이션 포인트' 열에 있는 스테이션 포인트를 선택합니다. 예를 들어, 특정 접두어나 접미어가 있는 스테이션 포인트를 선택할 수 있습니다.

참조: 이 특정 접두어나 접미어가 없는 포인트는 모두 선택 해제됩니다.

다음 조건의 포인트 선택 해제

이 옵션을 이용하여 [디지털 레벨 가져오기] 대화 상자의 '스테이션 포인트' 열에 있는 특정 포인트의 확인란을 선택 해제합니다.

참조: 이 특정 접두어나 접미어가 없는 포인트는 모두 선택됩니다.

이름

이름을 기준으로 포인트를 선택합니다. ?, *, # 같은 와일드 카드로써 포인트 이름을 선택할 수 있습니다.

설명

포인트를 그 설명을 기준으로 선택합니다. 와일드 카드로써 설명을 선택할 수 있습니다.

예:

[디지털 레벨 가져오기] 대화 상자의 '스테이션 포인트' 열에서 접두어가 밒S�인 포인트를 선택하지 않으려면,

1.	[레벨 스테이션 정의] 대화 상자에서 '다음 조건의 포인트 선택 해제' 옵션을 선택합니다.

2.	'이름' 옵션을 선택하여 IS*를 입력합니다.


망 조정에서 레벨 관측치 이용하기

레벨 데이터로써 망 조정을 수행하려면, 반드시 레벨 관측치 표준 오차를 정의하여야 합니다. 소프트웨어는 다음 상황에 있어 표준 오차를 계산합니다.

 디지털 레벨 데이터의 가져오기를 하는 경우에는 턴 수(Number of turns)를 이용하여 표준 오차(델타 표고)를 계산합니다.

  턴 수를 가져오기 포맷에 포함하는 경우에는 Trimble Data Exchange 포맷을 이용하여 표준 오차를 계산합니다. 또는, 그 파일로부터 표준 오차(델타 표고)를 직접 이용할 수도 있습니다.

레벨 관측치는 표준 오차가 정의되지 않으면 망 조정에 쓰이지 않습니다.

참조: 등록 정보 창에서 각 델타 표고에 대하여 표준 오차나 턴 수를 입력할 수 있습니다.


[GIS 내보내기 실패] 대화 상자

이 대화 상자는 GIS 내보내기가 실패한 경우 나옵니다.

실패의 원인으로는 다음 표에서와 같이 몇가지를 들 수 있습니다.


[지오이드 모델 선택] 대화 상자 - 문제 해결
[지오이드 모델 선택] 대화 상자 − 문제 해결

장치 파일의 가져오기 도중, 이 파일에 참조된 지오이드 모델 이름이 좌표계 데이터베이스(Current.csd)에 있는 지오이드 모델 이름의 어느 것과도 일치하지 않을 경우, 이 대화 상자가 나옵니다. 이용하고자 하는 지오이드 모델을 이 대화 상자에서 선택합니다.

이 대화 상자가 나오는 원인은 다음과 같습니다.


프린터 없음

Trimble Geomatics Office에서 인쇄나 플로팅을 하려면 사용자의 시스템에 프린터가 설치되어 있어야 합니다.

프린터 설치 방법:

1.	[시작]을 누릅니다.

2.	[설정 / 프린터]를 선택합니다. 프린터 창이 나옵니다.

3.	[프린터 추가]를 더블 클릭합니다.

설치 안내에 따라 프린터를 Microsoft Windows 설정에 추가합니다.

설치가 완료되면 Trimble Geomatics Office에서 인쇄를 할 수 있습니다.


[데이텀 그리드 선택] 대화 상자
[데이텀 그리드 모델 선택] 대화 상자

도입 파일에 참조된 결합 데이텀 그리드 파일 이름이 좌표계 데이터베이스의 어느 데이텀 그리드 파일과도 일치하지 않을 경우, 이 대화 상자가 나옵니다.

사용할 수 있는 최적의 결합 데이텀 그리드 파일을 [데이텀 그리드 선택] 대화 상자에서 선택합니다.

이 대화 상자가 나오는 원인은 다음과 같습니다.


Survey Controller (*.dc) 파일의 가져오기와 관련된 메시지/대화 상자

Survey Controller (*.dc) 파일을 Trimble Geomatics Office에 가져오는 경우, 소프트웨어 상에서 확인 작업이 이루어지는데 이 때, 파일의 좌표계와 프로젝트의 좌표계가 서로 같지 않다면 경고 메시지가 나옵니다.

다음은 Survey Controller (*.dc) 파일의 가져오기시 발생할 수 있는 메시지와 대화 상자입니다.

  파일의 가져오기 도중 하나 이상의 오류가 발생하였습니다.

  이 프로젝트에 정의된 피쳐 및 속성 파일이 다릅니다.

  피쳐 및 속성 파일이 이 프로젝트에 정의되어 있지 않습니다.

  파일을 가져올 수 없습니다.

  [기본 투영법 정의] 대화 상자

  [중복 포인트] 대화 상자

  [프로젝트 좌표계] 대화 상자

  [데이텀 그리드 선택] 대화 상자

  [지오이드 모델 선택] 대화 상자


메시지 - 파일의 가져오기 도중 하나 이상의 오류가 발생하였습니다
메시지 − 파일의 가져오기 도중 하나 이상의 오류가 발생하였습니다.

파일의 가져오기 도중, 하나 이상의 오류가 생겼습니다.

처리 방법:

  이 메시지와 오류를 무시하려면 [아니오] 단추를 누릅니다.

  오류를 보려면 [예] 단추를 누릅니다.

가져오기 보고서가 기본 HTML 뷰어에 나옵니다.

오류 메시지 링크를 누르거나, 가져오기 보고서의 오류 섹션으로 이동해서 해당 오류를 검토합니다.

필요한 경우, 그 오류를 해결하고 해당 파일을 다시 가져옵니다.


메시지 - 이 프로젝트에 정의된 피쳐 및 속성 파일이 다릅니다
메시지 − 이 프로젝트에 정의된 피쳐 및 속성 파일이 다릅니다.

Survey Controller (*.dc) 파일의 가져오기 도중,  속성을 위한 프로젝트의 구성에 쓰인 피쳐 및 속성 라이브러리나 데이터 딕셔너리 파일이 Survey Controller 파일에 참조된 그것과 다른 것으로 밝혀졌습니다.

처리 방법:

  Survey Controller 파일과 프로젝트에 공통되는 속성을 가져오려면 [예] 단추를 누릅니다.

  Survey Controller 파일에서 포인트만 가져오려면 [아니오] 단추를 누릅니다.

이 메시지가 다시 나오지 않도록 하기 위해서는 현장에서 속성 정보를 수집할 때 쓰는 라이브러리와 같은 라이브러리를 이용하도록 합니다.


메시지 - 피쳐 및 속성 파일이 이 프로젝트에 정의되어 있지 않습니다
메시지 − 피쳐 및 속성 파일이 이 프로젝트에 정의되어 있지 않습니다.

속성 정보가 포함된 Survey Controller (*.dc) 파일의 가져오기 도중, Trimble Geomatics Office가 프로젝트에 정의된 피쳐 및 속성 라이브러리나 데이터 딕셔너리 파일을 찾지 못하였습니다.

처리 방법:

  Survey Controller 파일의 측량 데이터만 가져오고 속성 정보는 무시하고자 하면 [확인] 단추를 누릅니다.

  Survey Controller 파일에 참조된 라이브러리와 동일한 라이브러리를 써서 속성을 위한 프로젝트를 구성([프로젝트 등록 정보] 대화 상자 / [피쳐] 탭 하에서)한 후, 그 파일을 다시 가져오려면 [취소] 단추를 누릅니다.


메시지 - 파일을 가져올 수 없습니다
파일을 가져올 수 없습니다.

파일 가져오기 도중, 오류가 발생하여 가져오기를 하지 못하였습니다. 다음 메시지가 나옵니다.

�파일 <파일 이름>을 가져올 수 없습니다.�

해당 파일이 현재 다른 프로그램(예: DC File Editor 유틸리티 등)에서 작업 중인지 확인합니다. 그렇지 않다면 이 파일이 손상된 것일 가능성이 있습니다.


피쳐 코드 - 개요
    피쳐 코드 − 개요

추가 정보

방법 ...	대화 상자	기타
개요

피쳐 코드는 어떤 처리 작업에 쓰고자 서로 그룹화할 필요가 있는 포인트들을 기록하는 방법입니다. 예를 들어, 울타리 선을 따라서 수집한 각 포인트에 'FENCE'라는 코드를 붙이면 사무실에 돌아와 피쳐 코드가 FENCE인 포인트를 모두 특정 선 스타일로써 상호 연결할 수 있습니다.

피쳐 코드를 이용하는 절차는 다음과 같습니다.

  피쳐 및 속성 라이브러리 (*.fcl) 파일을 만듭니다.

  이 라이브러리를 Trimble Survey Controller에 전송합니다.

  이 라이브러리를 TDS Survey Pro에 전송합니다.

  이 라이브러리의 피쳐 코드를 이용하여 데이터를 수집합니다.

  Survey Controller (*.dc) 파일을 Trimble Geomatics Office에 전송합니다.

  피쳐 코드를 처리합니다.

피쳐 및 속성 라이브러리는 명령어의 집합입니다.

새 라이브러리는 Feature and Attribute Editor 유틸리티로써 만드는데, 필요한 수만큼 제한없이 만들 수 있습니다. 피쳐 코드의 처리시, Trimble Geomatics Office는 라이브러리의 명령어에 의거, 선택 부분에 있는 데이터를 처리하게 됩니다. 피쳐 코드 필드의 값은 피쳐 및 속성 라이브러리상의 조건에 부합하는 경우, 그 관련 명령을 수행시킵니다.

피쳐 및 속성 라이브러리에 대한 자세한 사항은 Feature and Attribute Editor 도움말을 참조하십시오.


피쳐 코드 - 처리 순서
    피쳐 코드 − 처리 순서

 개요 및 추가 정보

현재의 선택 부분에 있는 피쳐 코드는 모두 처리되지만 그 처리 순서는 이용하는 선택 방법에 따라 달라집니다.

선택 집합

Survey Controller (*.dc) 파일을 가져올 때, 선택 집합이 만들어집니다. 이 선택 집합은 그 파일과 이름이 같은데, 현장에서 포인트를 수집하는 순서를 기록합니다. 이 선택 집합을 이용하는 경우, 피쳐 코드는 그 수집 순서대로 처리됩니다.

기타 선택 방법

다음 중 한 방법을 이용할 수도 있습니다.

  [선택] 메뉴에서 어떤 명령을 선택합니다.

  포인트를 클릭합니다.

이 방법 하에서는 데이터의 수집 순서대로 처리되지 않을 수 있습니다.


피쳐 코드 - 흔히 발생하는 오류
    피쳐 코드 − 흔히 발생하는 오류

 개요 및 추가 정보

다음은 피쳐 코드의 이용시, 주로 발생하는 오류입니다.

잘못된 선택 집합의 이용으로 인한 부정확한 연결

데이터 가져오기 과정에서 만들어지는 선택 집합을 이용하지 않고 그래픽 선택 부분(또는 [선택 / 모두 선택] 명령)을 이용할 때 부정확한 연결이 발생할 수 있습니다.

참조: 파일로부터 가져오는 개체는 모두 선택 집합에 저장됩니다. Survey Controller (*.dc) 파일의 경우, 선택 집합의 이름은 이 파일의 내부 작업 이름에 따라 정해집니다. 즉, 만들어지는 선택 집합은 도입 포인트들의 순서를 그대로 유지합니다. 이는, Survey Controller (*.dc) 파일의 경우, 그 선택 집합이 측량 작업의 수행 순서를 그대로 유지한다는 것을 의미합니다. 일반적으로 이것은 피쳐 코드의 처리에 필요합니다.

제어 코드를 잘못된 위치에 둠

예: CURB1 LP ST

이 포인트는 연석선(curb line)상에 있는 가로등(LP, lamp post) 관측치입니다. 이 연석 관측치는 새 연석선의 시작점이고, 가로등은 적절한 심벌로써 플로팅이 될 포인트입니다. 제어코드 ST (Start) 명령은 그 앞에 있는 포인트 코드(즉, 가로등)에 적용됩니다. 따라서 CURB1 코드의 마지막 포인트에서 현재 포인트로 선이 그어지는 잘못된 결과가 나옵니다.

올바른 예: CURB1 ST LP 또는 LP CURB1 ST

ST (Start) 명령을 사용하지 않음

이 경우, 코드가  같은 포인트들 사이에 단속선이 필요한 상황에서 연속선이 그어지는 잘못된 결과가 나옵니다.


필드 코드 - 개요
필드 코드 − 개요

추가 정보

 방법 ...

개요

필드 코드란 Trimble Geomatics Office로 하여금 필드에 정보를 삽입하도록 하는 특별한 명령어입니다. 필드 코드는 또 ASCII 가져오기/내보내기나 사용자 정의 보고서 작업에서 데이터베이스 데이터의 전송 처리에 이용됩니다. 필드 코드는 여러 개의 표제 아래 그룹으로 되어 있습니다. 각 표제의 목록과 그에 연결된 각 필드 코드의 상세한 내역을 원하시면, 필드 코드 내역를 보십시오.

Trimble Geomatics Office는 필드 코드를  광범위하게 이용합니다. 사용 예를 들면 다음과 같습니다.

  새로운 프로젝트를 만들 때 프로젝트 표제내의 프로젝트 이름과 날짜

  주석

  라벨

  사용자 정의의 포인트 라벨 붙이기

  ASCII 가져오기/내보내기

  보고서 정의

필드 코드는 항상 꺽쇠 괄호 안에 들어 있습니다. '[ ]'안에 들어 있는 모든 문자는 일단 필드 코드를 나타내는 것으로 보고, 값이 있는 경우는 해당 필드 코드값으로 바뀝니다.

예를 들면, 필드 코드 '[이름]'을 이용하여 데이터베이스의 모든 포인트에 각각 해당 이름으로 사용자정의 라벨을 붙이도록 Trimble Geomatics Office에 지시할 수 있습니다. 또한 필드 코드 '[표고]'를 추가하여 표고를 포함하도록 라벨들을 확장할 수도 있습니다.

예를 들어, 적절한 설정을 함으로써 [$좌표계.존]은 'California Zone 3 0403'을 나타낼 수도 있고  [피쳐 코드]는 '나무'를 나타낼 수도 있습니다. 또한  [날짜]나  [시간] 등의  필드 코드를 사용해서 컴퓨터 시스템의 현재 날짜나 시간 같은 다른 정보들을 출력할 수도 있습니다.

예를 더 들면, 필드 코드 이름=[이름] 표고=[표고] 는 다음과 같은 종류의 보고서를 생성할 수 있습니다

이름=3397 표고=18.762

이름=3396 표고=18.702

이름=3432 표고=?

이름=3436 표고=16.372

필드 코드를 이용하려면, 필드 코드를 추가하고자 하는 필드에서 마우스의 오른쪽 단추를 클릭합니다. 필드 코드가 이용 가능할 경우에는 바로가기 메뉴에 필드 옵션이 나옵니다.

구문

필드 코드의  구문은 세가지 요소로 구성됩니다.

[문맥.이름:옵션]

필드 코드 이름 가운데 혼돈을 없애려면 문맥 구성요소를 사용합니다. 예를들어, 필드 코드 [이름]은 항상 데이터베이스로부터 현재 포인트의 포인트 이름을 나타내는데, 만일 필드 코드를 사용하여 프로젝트 이름을 나타내기를 원한다면 필드 코드에 ' $프로젝트'  (즉, [$프로젝트.이름]이 됨)라는 문맥을 포함해야 합니다. 그렇지않으면 현재의 포인트 이름이 나타납니다.

문맥 구성요소는 선택 사항입니다. 만일 구성요소가 없으면 Trimble Geomatics Office는 가장 논리적인 문맥을 취합니다.

필드 코드에 포함될 수 있는 옵션은 대부분이 필드 코드를 위한 변경자입니다.이 구성요소도 역시 선택 사항입니다.


필드 코드 내역

 개요 및 추가 정보

필드 코드는 여러 표제 아래 그룹을 이루고 있습니다.

필드 코드 그룹	기능
데이터베이스	필드 코드 값을 전부 확인하게 합니다.
$시스템	컴퓨터 시스템 전반에 대한 자세한 내역을 액세스하게 함은 물론, 여러가지 특수 기능을 제공합니다.
$프로젝트	특정 프로젝트 정보를 액세스하게 합니다.
$표제	프로젝트 표제 필드에 기록된 데이터를 액세스하게 합니다.
$좌표계	프로젝트의 좌표계에 대한 내역을 액세스하게 합니다.
$투영법	프로젝트의 좌표계 투영법에 대한 특정 내역을 액세스하게 합니다.
$데이텀	프로젝트 좌표계의 데이텀 변환에 대한 특정 내역을 액세스하게 합니다.
$캘리브레이션	프로젝트 좌표계의 GPS 사이트 캘리브레이션 변환에 대한 특정 내역을 액세스하게 합니다.
도면 양식 필드 코드	도면 양식 정의에 쓰이며 플롯의 특정 내역을 표시합니다.
특수 필드 코드	컴퓨터 시스템 전반에 대한 자세한 내역을 액세스하게 함은 물론, 여러가지 특수 기능을 제공합니다. 특수 필드 코드의 종류: $파일   이 필드 코드는 명시한 파일의 내용을 출력합니다. $환경   이 필드 코드는 명명된 환경 변수를 호출합니다. $키 보고서에 유용하게 쓰이는 필드 코드로서, 입력한 텍스트를 호출합니다. $주석 이 필드 코드는 주석에 대한 텍스트 스타일이나 레이어가 그 주석 옆에 직접 명시되게 합니다.


데이터베이스 필드 코드

 개요 및 추가 정보

데이터베이스 필드 코드는 데이터베이스로부터 저장 값과 산출 값 모두를 직접 출력하게 해줍니다. 데이터를 가져올 테이블의 이름을 데이터베이스 필드 코드 앞에 선택적으로 붙일 수도 있습니다.

예를 들어, [포인트.Y 좌표]는 포인트 테이블에서 Y 좌표 값을 추출합니다. 단순히 [Y 좌표]라고 만 지정하면 그 포인트 테이블이 Y 좌표 필드를 가진 유일한 테이블인 한 역시 포인트의 Y 좌표 값을 추출합니다. 만일 조금이라도 불분명할 경우에는 반드시 테이블 이름을 지정해야 합니다.

사용 가능한 필드 코드는 문맥에 민감합니다. 유효한 이름은 문맥에 달려있으나 일반적으로 데이터베이스 테이블과 연관이 있는 필드 코드는 아래와 같습니다:

데이터베이스 필드 코드

데이터베이스 필드 값은 그 데이터베이스에서 직접 얻어집니다. (예를 들어, Y 좌표).

계산 필드 코드

아래 테이블은 유효한 계산 필드 코드를 보여주고 있습니다:

$중심{<분리 기호>}

호를 위해서는 특수한 ' $중심 ' 필드 코드가 있어서 중심점 이름(데이터베이스 포인트가 사용된 경우) 또는 중심점 좌표를 나타낼 수가 있습니다.

좌표 값들 사이에 표시되도록 분리 기호 문자를 지정할 수 있습니다. 만일 분리 기호 문자를 지정하지 않으면 Microsoft Windows 제어판 / 국가별 설정에 있는 '분리 기호 목록' 문자를 이용합니다.

첫째 좌표

출력 순서에 따른 첫째 좌표 값 (Y 좌표 또는 X 좌표).

둘째 좌표

출력 순서에 따른 둘째 좌표 값 (X 좌표 또는 Y 좌표).

첫째 좌표 이름

출력 순서에 따른 첫째 좌표 이름 (Y 좌표 또는 X 좌표).

둘째 좌표 이름

출력 순서에 따른 둘째 좌표 이름 (Y 좌표 또는 X 좌표).


시스템 필드 코드

 개요 및 추가 정보

시스템 필드 코드는 여러 가지 시스템 전반에 걸친 내역의 이용과 여러 가지 특수 기능을 제공합니다. 보고서에 추가 정보를 더하려면 시스템 필드 코드를 이용합니다.

참조: 이들 각각의 시스템 필드 코드에는 $시스템을 앞에 붙일 수 있습니다. 예를 들어, [$시스템.시간]은 필드 코드가 사용되고 있는 현재의 컴퓨터 시간을 표시합니다.

이런 필드 코드들은 $시스템을 앞에 붙일 필요는 없으나 혼돈을 피하기 위해서 사용합니다. 예를 들어, [시간]은 [$시스템.시간]과 같은 값을 표시합니다.

시간

필드 코드가 사용되고 있는 현재의 컴퓨터 시간을 표시합니다.

날짜

필드 코드가 사용되고 있는 현재의 컴퓨터 시스템 날짜를 표시합니다..

요약

'현재 개체'에 대한 요약을 표시합니다.

참조: 포인트에 사용되는 요약 필드 코드는 프로젝트와 연관된 Options.ini 파일에서 정의하고 있습니다. 그것은 통상적으로 [이름] : [피쳐 코드]의 형식으로 이름과 피쳐 코드 필드 코드를 사용합니다.

스페이스:<갯수>

하나 또는 그 이상의 스페이스를 출력합니다.

예를 들어, 필드 코드 [$시스템.스페이스:3]은 세 개의 스페이스를 나타냅니다..

반복<스트링>:<횟수>

텍스트의 반복된 부분을 표시합니다. 반복하고자 하는 텍스트는 반드시 화살표 괄호 (< >)안에 넣어야 합니다.

예를 들어, 필드 코드 [$시스템.반복<->:80]는 80개의 음수 기호를 표시합니다. 추가 정보를 원하시면, 매개 변수 입력 스크린을 보십시오.

열:<숫자>

어떤 행의 현재 위치로부터 지정한 열까지 스페이스를 출력합니다.

예를 들어, 필드 코드 [$시스템.열:40]은 현재 행에서 40번째 열에 이를 때까지 스페이스를 삽입합니다.

대체<찾기><대체>

특정 '찾기' 텍스트 모두를 '대체' 텍스트로 대체합니다. 대체<찾기><대체> 필드 코드는 반드시 찾아서 대체할 필드 뒤에 와야 합니다. 만일 대체 필드 코드가 찾아서 대체할 필드 앞에 나타나면 그 필드는 바뀌지 않을 것입니다.

대체 텍스트를 지정하는 것은 선택 사항입니다, 만일 이를 지정하지 않으면 '찾기' 텍스트만 행에서 지워지게 됩니다.

예를 들어, 필드 코드 [$시스템.대체<�><도>]는 현재 행에 있는 모든 돗수 심벌을 찾아서 '도'라는 단어로 바꿉니다.

문자:코드

문자 코드를 지정하여 문자를 삽입합니다.

참조: 출력되는 문자는 사용되고 있는 글꼴에 따라 달라집니다.

예를 들어, 필드 코드 [$시스템.문자:169]는  대부분의 글꼴에서 �로 출력됩니다.

사용자 이름

사용자 네트워크의 로그인 이름을 표시합니다.

컴퓨터 이름

네트워크의 고유 이름을 표시합니다. 이 고유 이름은 시스템의Microsoft Windows 제어판 / 네트워크에서 바꿀 수 있습니다.

정보

제품 이름과 버전 번호를 표시합니다.

예를 들어, Trimble Geomatics Office, 버전 1.00.

디렉토리 이름

특정한 시스템 관련 폴더 이름을 부여하기 위해 사용할 수 있는 필드 코드는 많고 다양합니다.

사용할 수 있는 디렉토리 이름들은 다음과 같습니다.

ASCII 내보내기

ASCII 내보내기에만 유효한 두개의 필드 코드는 다음과 같습니다.

계수기	사용된 필드 코드의 갯수를  표시합니다. 이것은 내보내는 각 값을 개별적으로 확인하기위해 사용할 수 있습니다.
행	내보내는 파일에 있는 행 번호를  표시합니다. 이것은 파일에 있는 모든 행의 행 번호를 기억하도록 ASCII 정의를 하기 위한 것입니다.


[매개 변수 입력] 대화 상자

경고: Trimble Navigation Limited는 Trimble사 소유의 Trimble Geomatics Office 소프트웨어를 이용하여 본 데이터베이스를 사용하고 수정한 경우에만 지원을 합니다. Trimble 사는 다른 응용 소프트웨어에 의한 본 데이터베이스의 사용 또는 수정을 지원(또는 승인) 하지 않고, 그 성능을 보증하지도 않습니다. Trimble사는 이 데이터베이스의  포맷을 수시로 바꿀 수 있으며 그 결과 다른 소프트웨어 응용프로그램과 호환이 불가능할 수도 있습니다.

이 대화 상자는 선택한 부분에 대한 질의나 필드 코드를 완성하기 위해 필요한 값을 입력 할 때 나타납니다. 매개 변수를 필요로 하는 선택부분에 대한 질의나 필드코드는 생략부호 (�)를 가지고 있습니다. 이 대화 상자는 Trimble Geomatics Office의 여러 곳에서 나타납니다.

이름

정의해야 할 매개 변수를 보여줍니다.

값

원하는 값을 입력합니다.

매개 변수 입력 대화 상자는 데이터베이스 질의 결과에 근거한 데이터베이스 보고서를 작성할 때 나타납니다.


프로젝트 필드 코드

 개요 및 추가 정보

프로젝트 필드 코드는 특정한 프로젝트 정보를 이용할 수 있도록 해줍니다. 보고서에 특별한 정보를 추가하기 위해서 이 필드 코드를 사용합니다.

참조: 각 프로젝트 필드 코드는 그 앞에 $프로젝트를 붙일 수 있습니다. 예를 들어,  [$프로젝트.투영법]은 프로젝트에 사용된 좌표계 투영법의 종류 이름을 표시합니다.

필드 코드앞에 $프로젝트를 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다. 예를 들어, [이름]은  [$프로젝트.이름]과 같은 값을 출력합니다.

이름

프로젝트에 사용된 프로젝트 이름을 표시합니다.

경로

프로젝트가 저장되어 있는 폴더 이름을 표시합니다.

참조: 이 필드 코드는 $시스템.프로젝트 디렉토리와 같은 내용을 출력합니다.

투영법

프로젝트에 사용된 좌표계 투영법 종류의 이름을 표시합니다. 예를 들면, Transverse Mercator.

자동 이름

현재의 포인트 이름을 자동으로 표시합니다.

예를 들어, 만일 이전에 배정되었던 자동 포인트 이름이 ' 자동 0008 '이었다면 ' 자동 0009 '가 출력됩니다.

CAD 레이어

현재의 CAD 레이어 이름을 표시합니다.

단위:종류

해당 단위 이름을 표시합니다. 반드시 종류를 지정해야 합니다.

참조: 거리, 표고, 좌표, 그리고 각도가 사용됩니다.

예를 들어, 필드 코드 [$프로젝트.단위:거리]는 시스템에 설정된 거리 단위를 표시합니다. 온전한 필드 코드 값을 얻기 위해서 'verbose'을 포함할 수 있습니다. 예를 들어, 'm' 대신 'Meters'로 출력하기위해서는 [$프로젝트.단위:거리:verbose]를 사용합니다.

종류:거리

거리 표시 방법을 표시합니다. 이것은 [파일 / 프로젝트 등록 정보] / [단위와 포맷]에서 설정할 수 있습니다..

종류:LLH

위도, 경도, 타원체고 (로컬 또는 WGS-84)의 표시 방법을 표시합니다.


표제 필드 코드

 개요 및 추가 정보

표제 필드 코드는 [프로젝트 등록 정보] 대화 상자의 프로젝트 내역 tab 내의 프로젝트 표제 필드에 기록되어 있는 데이터에 접근할 수 있게 해 줍니다. 보고서에 특별한 정보를 추가하고자 할 경우 이 필드 코드를 사용합니다.

참조: 각 표제 필드 코드는 앞에  $표제를 붙일 수 있습니다. 예를 들어, [$표제.제목]은 현재 프로젝트의 제목을 표시합니다.

만일 표제가 바뀌면, 그에 따라 사용 가능한 표제 필드 코드도 바뀝니다.

이 필드 코드 앞에 ' $표제 ' 를 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다.

표준 표제 필드 코드들은 아래와 같습니다:

제목

현재 프로젝트의 제목을 표시합니다.

설명

프로젝트에 대한 설명을 표시합니다.

참조

프로젝트  참조 번호를 표시해서 해당 프로젝트와 사무실 비용 정산과 연계할 수 있도록 해줍니다.

현장 측량자

이 필드 코드 출력은 추후 참조를 위해 유용할 수도 있습니다.

컴퓨터 조작원

이 필드 코드 출력은 추후 참조를 위해 유용할 수도 있습니다.

날짜

프로젝트 실행 일자를 표시합니다. 이것은 템플리트 프로젝트에 있는 날짜 필드 코드를 사용해서 자동으로 수행됩니다.

수직 데이텀

프로젝트의 수직 데이텀을 표시합니다.

장비

장비의 일련번호를 표시합니다.


좌표계 필드 코드

 개요 및 추가 정보

좌표계 필드 코드는 프로젝트 좌표계의 특정한 내역에 접근할 수 있도록 해줍니다. 보고서에 특별한 정보를 추가하고자 할 경우에는 이 필드 코드를 사용합니다.

참조: 각 좌표계 필드 코드는 앞에 $좌표계를 붙일 수 있습니다. 예를 들어, [$좌표계.좌표계]는 프로젝트에 사용된 좌표계의 이름을 출력합니다.

이 필드 코드앞에 $좌표계를 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다.

참조: 이용할 설정이 없는 경우에는 $좌표계 필드 코드는 '선택되지 않았음'을 출력합니다.

좌표계

프로젝트에 사용된 좌표계의  이름을 표시합니다(예를 들어, United States State Plane 1983).

존

프로젝트에서 사용된 좌표계 존의 이름을 표시합니다.(예를 들어, California Zone 3 0403).

데이텀

좌표계 투영법의 기반이 되는 데이텀의 이름을 표시합니다(예를 들어, North American 1983 (Conus)).

지오이드

프로젝트에서 사용된 지오이드 모델의 이름을 표시합니다(예를 들어, GEOID96 (Continental US)).

사이트

프로젝트의 사이트 정의 이름을 표시합니다.


투영법 필드 코드

 개요 및 추가 정보

투영법 필드 코드는 프로젝트의 좌표계 내에서 사용된 투영법의 특정한 내역에 접근하도록 해줍니다. 보고서에 특별한 정보를 추가하고자 할 경우에는 이 필드 코드를 사용합니다.

참조: 각 투영법 필드 코드는 앞에 $투영법을 붙일 수 있습니다. 예를 들어, [$투영법.이름]은 프로젝트에 사용된 좌표계 투영법의 이름을 표시합니다.

이 필드 코드 앞에 ' $투영법 ' 을 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다.

이름

투영법 종류의 이름을 표시합니다 (예를 들어, Transverse Mercator).

나머지 투영법 필드 코드들은 프로젝트에서 사용되는 투영법의 실제 매개 변수 값을 출력합니다.

참조: 모든 필드 코드가 모든 투영법 종류에 유효하지는 않습니다. 즉, 모든 필드 코드가 모든 경우에 유효하지는 않습니다. 아래 열거한 필드 코드는 출력 가능한 모든 투영법 매개 변수의 전 목록을 제공합니다. 프로젝트에서 사용되는 투영법에 따라, 적절한 필드 코드만이 값을 출력합니다. 투영법에 유효하지 않은 필드 코드는 '해당 사항 없음'을 출력합니다.

아래의 각 필드 코드는 구체적인 값을 표시합니다:

X 좌표 상수

투영법의 X 좌표 상수 값.

Y 좌표 상수

투영법의 Y 좌표 상수 값.

표고 상수

평면 투영법의 원점에서의 타원체고 값.

원점 타원체고

평면 투영법의 원점에서의 표고 값.

원점 위도

투영법을 위한 원점 위도.

원점 경도

투영법을 위한 원점 경도.

축척 계수

투영법을 위한 중앙 축척 계수 (unity 기준).

방위각

스큐 방위각 정의를 갖는 Oblique Mercator와 R.S.O. 투영법을 위한 스큐 방위각의 값.

수렴

원점 수렴 정의에 의한 스큐를 갖는 Oblique Mercator와 R.S.O. 투영법을 위한 스큐 방위각의 값.

위선 1

Lambert 2 위선 정의와 Albers Equal Area Conic 투영법에서 사용되는 북 위선.

위선 2

Lambert 2 위선 정의와 Albers Equal Area Conic 투영법에서 사용되는 남 위선.

포인트 1 위도, 포인트 1 경도, 포인트 2 위도, 포인트 2 경도

이 네 개의 필드 코드는 두개의 포인트에 의해서 정의되는Oblique Mercator와 R.S.O. 투영법에서 사용되는데, 이때 이 필드들이 정의 포인트 위치가 됩니다.


데이텀 필드 코드

 개요 및 추가 정보

데이텀 필드 코드는 프로젝트를 위한 좌표계 내에서 사용되는 데이텀의 특정한 내역에 접근하게 해줍니다. 보고서에 특별한 정보를 추가하고자 할 경우에는 이 필드 코드를 사용합니다.

참조: 각 데이텀 필드 코드는 앞에 $데이텀을 붙일 수가 있습니다. 예를 들어, [$데이텀.방식]은 그 프로젝트를 위해 사용되는 데이텀 방식의 이름을 표시합니다.

이 필드 코드 앞에 ' $데이텀 ' 을 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다.

참조: 모든 필드 코드가 모든 데이텀 종류에 유효하지는 않습니다. 즉, 모든 필드 코드가 모든 경우에 유효하지는 않습니다. 아래 열거한 필드 코드는 출력 가능한 모든 데이텀 매개 변수의 전 목록을 제공합니다. 프로젝트에서 사용되는 데이텀에 따라, 적절한 필드 코드만이 값을 출력합니다. 데이텀에 유효하지 않은 필드 코드는'해당 사항 없음'을 출력합니다.

아래의 각 필드 코드는 구체적인 값을 표시합니다:

방법

사용된 데이텀 변환법의 이름 (예를 들면, 3 매개 변수법)

X축 방향 평행 이동

X축 방향 평행 이동 값 (3 매개 변수법과 7 매개 변수법 데이텀 변환에 이용 가능)

Y축 방향 평행 이동

Y축 방향 평행 이동 값 (3 매개 변수법과 7 매개 변수법 데이텀 변환에 이용 가능)

Z축 방향 평행 이동

Z축 방향 평행 이동 값 (3 매개 변수법과 7 매개 변수법 데이텀 변환에 이용 가능)

X 축 회전

X축 회전 값 (7 매개 변수법 데이텀 변환에만 이용 가능)

Y 축 회전

Y 축 회전 값 (7 매개 변수법 데이텀 변환에만 이용 가능)

Z 축 회전

Z축 회전 값 (7 매개 변수법 데이텀 변환에만 이용 가능)

축척 계수

Parts per million (ppm)으로 표시된7 매개 변수법 데이텀 변환 축척 계수의 값

타원체 이름

프로젝트에 사용된 타원체의  이름

타원체 편평률

타원체의 편평률

장반경

타원체의 장반경


캘리브레이션 필드 코드

 개요 및 추가 정보

캘리브레이션 필드 코드는 프로젝트를 위한 좌표계 내에서 사용되는 GPS 사이트 캘리브레이션 의 특정한 내역에 접근하게 해줍니다. 보고서에 특별한 정보를 추가하고자 할 경우에는 이 필드 코드를 사용합니다.

참조: 각 캘리브레이션 필드 코드는 앞에 $캘리브레이션을 붙일 수가 있습니다. 예를 들어, [$캘리브레이션.회전]은 그 GPS 사이트 캘리브레이션의 평면 변환에 대한 회전 값을 표시합니다.

이 필드 코드앞에 $캘리브레이션 을 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다.

참조: 캘리브레이션 필드 코드는 GPS 사이트 캘리브레이션의 수평 구성요소와 수직 구성요소와 관련하여 두 그룹으로 나뉩니다. 어떤 그룹에 속하든지 해당 구성요소가 계산되었으면 모든 필드 코드는 유효합니다. 즉,  좌표계에 수직 캘리브레이션이 있으면 모든 수직 캘리브레이션 구성요소도 유효합니다. 아래의 필드 코드 목록은 출력 가능한 모든 캘리브레이션 매개 변수의 전 목록을 나타냅니다. 캘리브레이션을 위해 유효하지 않은 필드 코드는'N/A' (해당 사항 없음)을 출력합니다.

아래의 각 필드 코드는 구체적인 값을 표시합니다:

수직 원점 N

수직 변환 원점 포인트의 X 좌표 값.

수직 원점 E

수직 변환 원점 포인트의 Y 좌표 값.

수직 상수 보정

변환 원점 포인트에서 적용되는 수직 이동.

수직 보정 N

변환에서 적용되는 단위 N당 수직 보정치.

수직 보정 E

변환에서 적용되는 단위 E당 수직 보정치.

수평 원점 N

수평 변환 원점 포인트의 X 좌표 값.

수평 원점 E

수평 변환 원점 포인트의 Y 좌표 값.

N 방향 수평 평행 이동

북 방향에서 적용되는 수평 평행 이동 값.

E 방향 수평 평행 이동

동 방향에서 적용되는 수평 평행 이동 값.

축척 계수

수평 변환에서 적용되는 축척 계수 (unity 기준).

회전

수평 변환에서 적용되는 회전.


특수 필드 코드

 개요 및 추가 정보

특수 필드 코드는 전 컴퓨터에 걸친 내역을 이용할 뿐만 아니라 다양한 특수 기능을 제공합니다. 보고서에 특별한 정보를 추가하고자 할 경우에는 이 필드 코드를 사용합니다.

$파일.파일이름

이 필드 코드는 지정된 파일의 내용을 표시합니다.

참조: 일부 필드 코드 정의에 사용되는 콜론 부호와의 상충 때문에 컴퓨터 드라이브를 정의하는 데 콜론부호(:)를 사용할 수 없습니다. 드라이브를 지정하려면 '드라이브:' 대신 <드라이브>를 사용합니다. 예를 들어, <C>는 C: 드라이브를 지정합니다.

Trimble Geomatics Office는 표준 디렉토리의 출력을 위해 일부 특수 필드 코드를 사용합니다.

$홈 (TGOffice.exe 파일이 위치한 디렉토리)

$시스템 (TGOffice.exe 파일이 위치한 $홈 아래 있는 시스템 서브 디렉토리)

$프로젝트 (현재 프로젝트의 디렉토리)

예를 들면 [$파일.<c>\temp\data.txt] or [$파일.$시스템\myfile.txt]

참조: 여기서 ':확장'을 사용할 수도 있습니다.

$환경변수

지명된 환경변수를 표시합니다.

$키.키

주어진 키와 함께 ini 파일 (또는 레지스트리)로부터 얻어진 스트링을 표시합니다.

필드 코드 '이름'의 포맷은 키{,섹션}{;경로} 입니다.

만일 섹션이 빠져있으면 '필드 코드'가 사용되고, 만일 경로가 빠져있으면  $시스템으로 간주합니다.

$파일 과 마찬가지로, 경로도 아래의 코드 중 어느것으로 시작할 수 있습니다:

  $홈

  $시스템

  $프로젝트

참조: 만일 경로가  $프로젝트뿐일 경우에는 그 프로젝트의 *.ini 파일이 사용됩니다. (먼저 옵션.ini를 검사하고 다음에 tgo_v100.ini를 검사합니다. � 이 .ini 파일들은 각 프로젝트와 관련된 파일들입니다.) 만일 경로가 $시스템뿐인 경우에는 레지스트리에 있는Trimble Geomatics Office의 영역이 사용됩니다.

$텍스트.텍스트

입력한 텍스트를 표시합니다. 이것은 보고서에 유용합니다.

예를 들어 [$텍스트.피쳐 코드:20]는 포인트로부터 20 스페이스에 위치한 라벨 '피쳐 코드'를 표시합니다.


도면 양식 필드 코드

 개요 및 추가 정보

도면 양식의 정의에는 여러 개의 특수 필드 코드가 주어집니다. 플롯에 한정된 내역을 표시하게 하기 위해서 도면 양식 정의 내에서 이 코드를 사용합니다.

참조: 각 도면 양식 필드 코드는 앞에 $플롯을 붙일 수 있습니다. 예를 들어, [$플롯.축척]은 해당 플롯의 플롯 축척을 표시합니다.

이 필드 코드 앞에 $플롯을 꼭 붙일 필요는 없지만, 혼돈을 피하기 위해서 사용합니다.

축척

플롯을 위한 플롯 축척을 표시합니다.

원점 첫째 좌표 이름

원점 첫째 좌표 이름을 표시합니다. 예를 들어, 파일 / 프로젝트 등록 정보 / 단위와 포맷 / 좌표 순서 옵션이 N 먼저에 설정된 경우, [$플롯.원점 첫째 좌표 이름]은 'X 좌표'를 표시합니다.

원점 둘째 좌표 이름

원점 둘째 좌표 이름을 표시합니다. 예를 들어, 파일 / 프로젝트 등록 정보 / 단위와 포맷 / 좌표 순서 옵션이 N 먼저에 설정된 경우, [$플롯.원점 둘째 좌표 이름]은 'Y 좌표'를 표시합니다.

원점 첫째 좌표

원점 첫째 좌표 값을 표시합니다. 예를 들어, 파일 / 프로젝트 등록 정보 / 단위와 포맷 / 좌표 순서 옵션이 N 먼저에 설정된 경우, [$플롯.원점 첫째 좌표 이름]은 플롯 원점 X 좌표 값을 표시합니다.

원점 둘째 좌표

원점 둘째 좌표 값을 표시합니다. 예를 들어, 파일 / 프로젝트 등록 정보 / 단위와 포맷 / 좌표 순서 옵션이 N 먼저에 설정된 경우, [$플롯.원점 둘째 좌표 이름]은 플롯 원점 Y 좌표 값을 표시합니다.

원점 N

플롯 원점 X 좌표 값을 표시합니다.

원점 E

플롯 원점 Y 좌표 값을 표시합니다.

회전

해당 플롯을 위해 명시된 회전 값을 표시합니다.

도면 양식

도면 양식 정의에 명시된 도면 양식의  이름을 표시합니다.


변경자

 개요 및 추가 정보

필드 코드 변경자는 필드 코드의 출력을 변경하는데 사용하는 특수 명령어입니다.

변경자를 사용하여 다음과 같은 일을 수행합니다.

  필드 코드로부터 원하는 특정한 출력을 얻을 수 있습니다.

  데이터를 출력할 때 추가 포맷팅 정보나 추가 매개 변수를 제공할 수 있습니다.

단일 필드 코드를 변경하기 위해 여러 개의 변경자를 사용할 수 있습니다. 많은 수의 변경자가 사용될 경우 통상 아래와 같이 명시됩니다:

	[필드 코드{:FormatItem}{:FormatItem}{:FormatItem}{:FormatItem}]
여기서FormatItem은 변경자 이름 또는 포맷 레이아웃이 됩니다. 중괄호 { } 는 선택항목 임을 의미합니다.

변경자를 지정할 때, 시스템은 대문자 또는 소문자 또는 혼합 문자 모두를 인정합니다.

가능한 변경자는 다음과 같습니다:

너비 값 (숫자)

필드 코드로부터 출력되는 너비를 명시합니다. 만일 너비 값이 음수이면 출력은 왼쪽 정렬이고, 양수이면 오른쪽 정렬입니다.

예를 들어, 만일 피쳐 코드 = "sample code"라면, [피쳐 코드:15]는 "    sample code"로 출력합니다 (즉, 앞에 4개의 스페이스를 추가하여 15 문자로 늘립니다).

너비.소수 값 (숫자)

필드 코드로부터 출력되는 소수점 자리의 너비와 숫자를 명시합니다. 변경자는 W.D로 표시되는데 여기서  W는 너비이고 D는 소수점 자리 숫자입니다.

만일 너비 값이 음수이면 그 필드는  왼쪽 정렬이고, 양수이면 오른쪽 정렬입니다.

만일 너비 값이 0으로 시작하되 0이 아닌 경우 (예를 들어, 08.3)에는 늘리기를 스페이스로 하지 않고 0으로 합니다.

예를 들어,	표고 = 10.3258이면

[표고:0.3]은 10.326을 출력하고

[표고:07.2]는 0010.33을 출력합니다

단위

값 뒤에 단위를 붙입니다. 예를 들어, 미터에는m, International feet에는 ift, US 측량 feet에는 sft를 붙입니다. 파일 / 프로젝트 등록 정보 / 단위와 포맷 탭에서 표시단위 옵션이 아니오 로 설정되어있을 경우라도 단위를 표시하기 위해서 이 변경자를 사용할 수 있습니다.

무단위

값 뒤에 단위를 표시하지 않도록 합니다. 파일 / 프로젝트 등록 정보 / 단위와 포맷 탭에서 표시단위 옵션이 예 로 설정되어 있을 경우라도 단위가 표시되지 않도록 하기 위해서 이 변경자를 사용할 수 있습니다.

대문자

필드 코드로부터 출력되는 모든 영문자를 대문자로 변환합니다.

소문자

필드 코드로부터 출력되는 모든 영문자를 소문자로 변환합니다.

오른쪽

필드 코드로부터의 출력을 지정된 필드 너비 내에서 오른쪽 정렬을 해줍니다. 만일 필드 너비가 지정되어 있지 않으면 정렬은 실행되지 않습니다.

왼쪽

필드 코드로부터의 출력을 지정된 필드 너비 내에서 왼쪽 정렬을 해줍니다. 만일 필드 너비가 지정되어 있지 않으면 정렬은 실행되지 않습니다.

가운데

필드 코드로부터의 출력을 지정된 필드 너비 내에서 가운데 정렬을 해줍니다. 만일 필드 너비가 지정되어 있지 않으면 정렬은 실행되지 않습니다.

예를 들어, 만일 피쳐 코드 = "example"이면

[피쳐 코드:11:가운데]는 "  example  "로 표시됩니다.

즉, 이 경우에는 앞에 2개와 뒤에 2개의 스페이스를 가지고 출력됩니다.

정돈

주어진 너비에 맞게 출력을 정돈합니다 (너비가 양수이면 앞에서부터,너비가 음수이면 뒤에서부터).

예를 들어, 만일 피쳐 코드 = Example이면

[피쳐 코드:4:정돈]은 'Exam'을 출력하고

[피쳐 코드:�4:정돈]은 'mple'을 출력합니다

확장

'확장'이 적용되는 필드 코드에 의해서 출력되는 텍스트에 있는 모든 필드 코드를 확장합니다.

예를 들어, 어떤 파일의 가져오기에서 사용될 경우 필드 코드 [$파일.$시스템\텍스트.txt:확장]는 출력하기 전에 텍스트.txt 파일에 있는 모든 유효한 필드 코드를 확장합니다.

표준

출력을 표준 숫자 구두점으로 변환합니다. (소수점을 표시하는 데 점을 사용하며, 천 단위를 구분하는 분리 기호를 사용하지 않음).

참조: 이 변경자는 보고서 정의에만 적용됩니다. 가져오기 루틴은 표준형식으로 되어 있는 숫자 데이터(천 단위 숫자 분리기호가 아닌 소수점)를 수용할 수도, Microsoft Windows 시스템에 설정되어 있는 숫자 분리기호와 소수점 기호를 가진 값을 수용할 수도 있습니다.

역

해당 필드 코드의 의미를 역으로 바꿉니다. 예를 들어, [방위각:역] 은 주어진 행에 정상적으로 출력될 방위각을 역으로 바꿉니다.

사분원

방위각을 사분각으로 보여줍니다. 예를 들어, 방위각 228�37'25"는 N81�22'35"W로 나타납니다.

전각원

방위각을 전각원 방위로 보여 줍니다. 예를 들어, 만일 방위각 포맷이 사분각 방위 N 81 도 22분 35초 W로 설정되었다면, 이것은228�37'25"로 나타납니다..

무 축약

해당 용어를 축약하지 않고 풀어 사용하게 합니다. 예를 들어, 만일 단위가 'm'로 축약되어있는 경우에 이 변경자를 사용하면 '미터'로 표시됩니다.

분할

스트링을 소수점에서 분할합니다.

예를 들어, 변경자 [표고:분할]은 표고를 소수점 없이 출력합니다.

참조: 이 변경자는 주석 템플리트를 설계할 때 주석을 걸침 (On)  포인트에 위치할 경우에 유용합니다.

이 변경자는 '.'를 단일 스페이스로 대체하는데, 이것을 예를들어 :분할<3> 등을 이용하여 늘릴 수 있습니다.

IntPart

값에서 소수 부분을 제거합니다. ('.'까지).

FracPart

값에서 정수 부분을 제거합니다. ('.'부터).

묵시

소수점이 수치 값으로 제시되지는 않았으나 그 위치가 암시되어 있는 ASCII 파일의 가져오기와 내보내기를 다룹니다.  이 변경자는 표준 너비와 소수 변경자와 함께 사용됩니다.

예를 들어, [X 좌표:10.3:묵시]는 X 좌표 값 4853297.692를  4853297692로 출력할 것입니다. 같은 필드 코드 정의는 가져오기에서 암시적인 소수점을 가진 값의 정확한 해석을 가능하게 합니다.


포맷 레이아웃

 개요 및 추가 정보

포맷 레이아웃은 필드 코드를 구성할 수 있게 해줍니다.

예를 들어, 포맷 레이아웃 구성요소를 이용해서 날짜에 대한 필드 코드를 구성할 수 있습니다.

	[날짜:<{DDDD}, {MMM} {D}-{YYYY}!>]
이것은 Sunday, Oct 17 1999!을 출력합니다.

참조: 필드 코드는 어떠한 텍스트도 포함할 수 있습니다. 위의 예에서는 느낌표가 포함되었습니다.

포맷 레이아웃은 언제나 화살표 괄호 (< >)안(완전 포맷 레이아웃)이나 중괄호 ({ }) 안(포맷 레이아웃의 구성요소)에 들어 있습니다.

포맷 레이아웃은 특정한 데이터 종류에만 적용됩니다. 다음과 같은 것들이 있습니다.

  날짜 포맷 레이아웃

  시간 포맷 레이아웃

  각도/방위 포맷 레이아웃

각도/방위가  완전한 포맷 레이아웃을 제공하는 반면, 날짜와 시간은 포맷 레이아웃의 구성요소를 제공합니다.


날짜 포맷 레이아웃

 개요 및 추가 정보

날짜 포맷 레이아웃은 필드 코드를 위해 날짜 구성요소의 출력을 제어하게 해줍니다. 예를 들어, 구성요소 dd를 포함하고 있는 날짜 필드 코드는 앞에 0을 붙인 날짜를 출력합니다.

참조: 바로가기 메뉴인 필드 / 고급 / 계속 / 포맷 레이아웃 옵션 하에서는 대표 값을 사용하는 표본 날짜 포맷 레이아웃을 이용할 수 있습니다. 이 표본 날짜 포맷 레이아웃은 여기에 열거된 상세한 필드 코드를 사용할 수 있도록 자동으로 변환됩니다.

사용 가능한 날짜 포맷 레이아웃의 모든 내역은 아래와 같습니다.


시간 포맷 레이아웃

 개요 및 추가 정보

시간 포맷 레이아웃은 필드 코드를 위해 시간 구성요소의 출력을 제어하게 해줍니다. 예를 들어, 시간 필드 코드는 0으로 시작하는 시간을 출력하기 위하여 구성요소 hh를 포함할 수 있습니다(12 시간 시각).

참조: 바로가기 메뉴인 필드 / 고급 / 계속 / 포맷 레이아웃 옵션 하에서는 대표 값을 사용하는 표본 시간 포맷 레이아웃을 이용할 수 있습니다. 이 표본 시간 포맷 레이아웃은 여기에 열거된 상세한 필드 코드를 사용할 수 있도록 자동으로 변환됩니다.

사용 가능한 시간 포맷 레이아웃의 모든 내용은 아래와 같습니다.

참조: 포맷 레이아웃의 일 중 시간 구성요소는 시간, 분, 초, 밀리 초,  t 또는 tt 의 순서로 배열되어야 합니다. 이중 어느 것이나 생략할 수 있습니다.

날짜와 시간 구성요소는 모두 날짜와 시간 필드 코드에 사용될 수 있으며, 반영된 데이터는 모든 정보를 가지고 있습니다. 분(m)과 월(M)을 구분하는 데는 구성 요소 대소문자 크기가 중요합니다.

예:

<DDDD, MMM D, YYYY!> 는 'Thursday, Oct 14 1999!' 를 출력합니다.

<hh mm sstt!> 는 '01 02 07pm!' 을 출력합니다.


각도 / 방위 포맷 레이아웃

 개요 및 추가 정보

각도/방위 포맷 레이아웃은 필드 코드를 위한 각도/방위 구성요소의 출력을 제어하게 해줍니다. 예를 들어, 방위각을 도와 소수 분으로 출력하기 위해서 방위각 필드 코드에 구성요소 <dm.mm>을 포함할 수 있습니다.

참조: 각도/방위 포맷 레이아웃은 바로가기 메뉴인 필드 / 고급 / 계속 / 포맷 레이아웃 옵션에서 이용할 수 있습니다.

이용 가능한 각도/방위 포맷 레이아웃의 종류는 아래와 같습니다.

소수 초

도, 분, 소수 초를 사용해서 각도/방위를 보여줍니다 (각도 단위가 도로 설정되어 있는 경우). 이 포맷 레이아웃은 레이아웃 문자 <dms.ss> 를 삽입합니다. 예를 들어, [방위각:0.3:<dms.ss>]는 방위각 값을 초 단위로 소수점 이하 3자리까지 출력합니다.

소수 분

도와 소수 분을 사용해서 각도/방위를 보여줍니다 (각도 단위가 도로 설정되어 있는 경우). 이 포맷 레이아웃은 레이아웃 문자 <dm.mm> 를 삽입합니다. 예를 들어, [방위각:0.4:<dm.mm>]은 방위각 값을 분 단위로 소수점 이하 4자리까지 출력합니다.

소수 도

소수 도를 사용해서 각도/방위를 보여줍니다 (각도 단위가 도로 설정되어 있는 경우). 이 포맷 레이아웃은 레이아웃 문자 <d.dd>를 삽입합니다. 예를 들어, [방위각:0.6:<d.dd>]은 방위각 값을 도 단위로 소수점 이하 6자리까지 출력합니다.

부호 소수 도

소수 도를 사용하여 각도/방위를 출력하며(각도 단위가 도로 설정되어 있는 경우), 값 앞에 부호 문자를 포함합니다. 이 포맷 레이아웃은 레이아웃 문자 <+d.dd>를 삽입합니다. 예를 들어, [위도<+d.dd>:0.8]은 위도 값을 도 단위로 소수점 이하 8자리까지 표시하며, 값 앞에 표지 문자 (+ 또는 �)를 포함합니다.


필드 코드 치환

 개요 및 추가 정보

필드 코드 치환은 일부 필드 코드가 아닌 특수 문자 연속을 인식합니다. 이것은 아래와 같이 설정됩니다.

예:

탭 구분형 ASCII 출력 포맷을 생성하기 위해서, 아래의 필드 코드를 사용합니다:

[이름]\t[Y 좌표]\t[X 좌표]\t[표고]\t[피쳐 코드]

한 줄에 방위각, 다음 줄에 거리가 오는 행에 주석을 달기위해서는 아래의 필드 코드를 사용합니다.

[방위각]|[거리]


필드 코드와 ASCII 가져오기

 개요 및 추가 정보

가져오기 포맷에서 허용된 필드 코드는 아래와 같습니다.

  포인트 테이블에 있는 필드만

  서브 레코드와 시스템 필드 코드는 제외

([$시스템.반복<찾기><대체>]는 예외로 허용됨.)

일부 산출 필드는 허용됩니다 (예를 들어, 위도/경도).

$건너뛰기

ASCII 입력 해석에 도움을 주기위한 특별 영역 ($건너뛰기)이 있습니다:

스페이스

이 필드 코드는 너비에 의해 주어진 스페이스 수만큼, 또는 너비가 주어지지 않은 경우는 공백이 없는 부분으로 건너 뜁니다. 건너뛰기 앞에 반드시 스페이스를 두어서 Trimble Geomatics Office로 하여금 직전 필드가 끝나는 곳을 알게 하여야 합니다. 예를 들면:

[이름] [$건너뛰기.스페이스][X 좌표] [$건너뛰기.스페이스][Y 좌표] [$건너뛰기.스페이스]

숫자

이 필드 코드는 숫자 (문자 '+', '�', '.' & '0'...'9')를 건너 뜁니다. 만일 너비가 있는 경우는 해당 문자의 수만큼 건너뛰고, 그렇지 않은 경우는 첫번째 나오는 숫자 아닌 문자까지 건너 뜁니다.

참조: 이것은 공백값 또는 지수에는 효력이 없습니다.

행

이 필드 코드는 너비에 의해서 주어진 숫자의 행만큼 또는 한 행만큼 건너 뜁니다.

텍스트

이 필드 코드는 주어진 문자의 수만큼 또는 인쇄되지 않는 문자 (예를 들어, '\n')까지 건너 뜁니다.

열

이 필드 코드는 주어진 열 번호까지 건너 뜁니다.

To:스트링

이 필드 코드는 주어진 스트링 다음에 오는 첫번째 문자까지 건너 뜁니다 (예를 들어, [$건너뛰기.To:개체]).

참조: 스트링은 새로운 줄을 포함할 수 없습니다.

아래와 같은 몇 가지 특수 '포맷 기능'이 있습니다:

표준

이 포맷 기능은 표준 구두점 형식의 입력을 변환합니다: '.'이 소수점 문자로 바뀝니다.

건너뛰기

이 포맷 기능은 필드를 정상으로 읽기는 하지만 저장하지는 않습니다 (예를 들어 [포인트.수평 정밀도:10.3:건너뛰기]).

= (등호)

이 포맷 기능은 나머지 포맷 스트링을 사용하여 필드의 값을 지정합니다. 이것은 파일을 참조하지 않습니다 (예를 들면, [피쳐 코드:=imported]). 이런 필드는 정의 필드 코드 스트링에서 맨 앞에 와야 합니다 (그렇지 않으면 문맥에 혼돈이 생깁니다). 예를 들어 '[표고:=0.0][이름],[X 좌표],[Y 좌표]'

참조: ASCII 가져오기 포맷을 정의할 때 필드 코드에 너비를 지정하거나 (예를 들어, [WGS 위도:11]) 필드 코드 사이에 분리문자를 지정해야 합니다 (예를 들어, [WGS 위도],[WGS 경도],[WGS고] 여기서 콤마는 '필드'의 끝을 표시합니다). 가져오기 명령이 ASCII 파일의 값을 해석하려고 시도할 때, 주어진 데이터 필드 안으로 읽어 들일 각 파일 행의 부분들을 이해 하기위해서 포맷 정의를 이용하기 때문입니다. 너비 또는 분리 문자는 파일 행의 해당 부분들의 위치를 발견하도록 해줍니다.

참조: 천분의 1초 단위에 가깝도록 이벤트 시간을 출력하기 원하면 필드 코드에 다음의 시간 포맷 레이아웃 <H:mm:ss.nnn>을 추가합니다, 여기서 nnn은 소수 초 숫자입니다. 예를 들면, [포인트 Obs.시간:<H:mm:ss.nnn>]. 시간 정밀도를 증가시키려면, 소수 초 숫자를 증가시키십시오. 예를 들어, nnnn은 첫번째 4개의 소수 초를 출력합나다 .


[필드 코드 매개 변수] 대화 상자

필드 코드를 완성하기 위해서 이 대화 상자를 이용합니다. 대화 상자의 제목은 문맥을 나타냅니다.

이름

이 열은 정의될 매개 변수를 표시합니다.

값

원하는 값을 입력합니다.


Trimble Survey Controller 소프트웨어로 파일 전송 - 개요
Trimble Survey Controller로 파일 전송 - 개요

추가 정보

방법 ...	대화 상자
개요

현장에서 필요로 하는 파일을 Trimble Survey Controller로 전송할 수 있습니다. 그렇게 하기 위해서는 Data Transfer유틸리티에 Survey Controller 장치 설정이 필요 합니다.

다음과 같은 종류의 파일을 전송시킬 수 있습니다:

  안테나 파일

  데이텀 그리드 파일 (*.cdg)

  데이터 컬렉터 파일 (*.dc)

  데이터 딕셔너리 파일 (*.ddf)

  DTM 점

  피쳐 및 속성 라이브러리 (*.fcl)

  지오이드 그리드 파일 (*.ggf)

  UK National Grid 파일 (*.pgf)

  CSV 파일

  배경 맵 파일


[안테나 내역을 Survey Contoller로] 옵션

안테나 파일에서 안테나 정보를 편집하였을 경우, 편집한 이 정보를 Trimble Survey Controller로 전송할 때 쓰는 옵션입니다.

 Trimble Survey Controller 버전 6.00 이상의 경우에는, 안테나 내역이 Antenna.ini 파일에 저장되어 있습니다.

 Trimble Survey Controller 버전 5.03 이하의 경우에는, 안테나 내역이 Antenna.dat 파일에 저장되어 있습니다.

참조: 안테나 내역을 내보내기 위해서는 Program Files\Common Files\Trimble\Config 폴더에서 해당 안테나 파일을 찾으십시오.


[Survey Controller 파일 (*.dc)] 옵션

Survey Controller 파일은 Trimble Geomatics Office와 Trimble Survey Controller를 연결 시켜줍니다. 이 파일들은 Trimble Survey Controller 작업으로부터 어떤 작업을 가져올 때나 Trimble Geomatics Office 프로젝트를 이 파일 포맷으로 내보낼 때 만들어 집니다.

Trimble Geomatics Office를 사용하여 다음 작업들을 할 수 있습니다:

  Survey Controller 파일  가져오기 (*.dc)

  후에 Trimble Survey Controller로 전송하기 위하여, Trimble Geomatics Office 프로젝트를 Survey Controller 파일(*.dc)로 내보내기

Survey Controller 파일(*.dc)을 가져오기 위해서는:

1.	[파일 / 가져오기]를 선택하면 [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[Survey Controller 파일 (*.dc)] 옵션을 선택한 후 [확인]을 클릭합니다. [열기] 대화 상자가 나옵니다.

4.	가져오기를 원하는 폴더로부터 파일을 선택하고 [열기]를 클릭합니다.

현재의 Trimble Geomatics Office 프로젝트를 Survey Controller 파일 (*.dc) 로 내보내기 위해서는:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	[측량]탭을 선택합니다.

3.	[Survey Controller 파일 (*.dc)] 옵션을 선택합니다.

4.	[옵션]을 클릭하고 [데이터 컬렉터 옵션] 대화 상자가 열리면, Survey Controller 파일 버전과 파일 작업 이름을 지정 합니다.

5.	설정을 수용하고 [내보내기] 대화 상자로 돌아가기 위하여 [확인]을 클릭합니다.

6.	[확인]을 클릭합니다. 그러면 [다른 이름으로 저장] 대화 상자가 나옵니다.

7.	파일을 저장하고 싶은 폴더를 선택합니다.

8.	기본값으로, 파일 이름은 프로젝트 이름을 사용하게 됩니다. [파일 이름] 필드에 바꾸고싶은 이름을 넣고 [저장]을 클릭합니다.


[측량 장치] 옵션

Trimble Geomatics Office를 사용하여Trimble Geomatics Office 프로젝트와 Trimble Survey Controller 사이에 데이터를 직접 전송할 수 있습니다. 작업이 Trimble Survey Controller로부터 들어올 때, 이는 Trimble Geomatics Office가 사용하고 있는 Survey Controller 파일 (*.dc) 포맷으로 바꾸어 집니다.

Trimble Geomatics Office는 다음의 경우에 사용할 수 있습니다:

  Trimble Survey Controller에서 작업 가져오기

  Trimble Geomatics Office 프로젝트를 Trimble Survey Controller로 내보내기

이 옵션을 이용하려면 다음 중 하나의 방법을 사용 합니다.

  Survey Controller 작업을Trimble Geomatics Office 프로젝트로 가져오려면:

1.	[파일 / 가져오기]를 선택하면 [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[측량 장치] 옵션을 선택하고 [확인]을 클릭합니다. 그러면 [불러오기] 대화 상자가 나옵니다.

Trimble Geomatics Office 프로젝트를 Survey Controller로 내보내려면:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[측량 장치] 옵션을 선택합니다.

4.	[옵션]을 클릭하여 [데이터 컬렉터 옵션] 대화 상자를 연후, Survey Controller 파일 버전과 파일의 내부 이름을 지정 합니다

5.	설정을 수용하고 [내보내기] 대화 상자로 돌아가기 위하여 [확인]을 클릭합니다.

6.	[확인]을 클릭하면 [다른 이름으로 저장] 대화 상자가 나옵니다.

7.	측량 장치를 하나 선택합니다.

8.	[불러오기]를 클릭합니다. 그러면 해당 컴퓨터와 Trimble Survey Controller가 연결됩니다.

9.	주 메모리 또는 측량데이터 카드 옵션을 선택합니다 (이용 가능한 경우).

10.	[불러오기]를 클릭합니다. 소프트웨어는 사용자가 선택한 폴더를 읽어 들이고 폴더 내에 있는 모든 Trimble Survey Controller 작업을 보여줍니다.

11.	[파일 이름] 필드에 새로운 .dc 파일이름을 입력합니다.

12.	[저장]을 클릭하여 .dc파일을 만들고 이를 Trimble Survey Controller로 전송합니다.

참조: Trimble Survey Controller 버전 7.60와 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.


[데이터 컬렉터 옵션] 대화 상자

데이터를 전송받을 장치를 지정하기 위하여 이 대화 상자를 사용합니다.

이 기능을 이용하려면:

1.	[파일 / 내보내기]를 선택합니다. [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	다음 옵션 중에 하나를 선택합니다.

  DTM 점을 파일로

  DTM 점을 Survey Controller로

  피쳐 및 속성 라이브러리를 Survey Controller로

  SDR 파일

  Survey Controller

  Survey Controller 파일

4.	[옵션]을 클릭합니다.

참조: 이용 가능한 필드는 선택된 옵션에 달려있습니다.

버전

데이터 포맷에 관련된 버전을 선택합니다.

작업  / 파일 이름

내보낼 작업이나 파일 형식에 대한 이름을 보여줍니다. 작업을 내보낼 때 Trimble Geomatics Office 프로젝트의 이름이 기본적으로 입력됩니다. 키보드를 사용하여 파일의 새로운 이름을 입력합니다.

피쳐 및 속성 출력

프로젝트에 사용된 피쳐와 속성 라이브러리를 전송하기 위해, 그리고 내보내는 프로젝트의 포인트에 지정된 어떠한 피쳐와 속성 정보를 전송하기 위하여 이 체크박스를 선택합니다. 이 옵션은 Survey Controller 버전 7.00 이상에서만 이용가능합니다.

선과 호 내보내기

프로젝트에서 쓰는 선과 호를 Trimble Survey Controller에 내보내려면 이 확인란을 선택합니다. 이 옵션은 선택 집합에 선과 호가 포함되어 있을 때에만 이용할 수 있는데, Trimble Survey Controller 10.00 이상에서만 가능한 옵션입니다.�

출력 형식

장치 파일로 내보내고자 하는 포인트의 출력 형식을 선택합니다.

출력 형식은 WGS-84나 또는 그리드 위치가 될 수 있습니다. 선택된 데이터 포맷과 버전, 그리고 데이터 좌표계의 정의에 따라서 달라지므로 두 가지 옵션이 항상 가능하지는 않습니다. 예를 들어 버전 4.00 이하의 Trimble Survey Controller는 WGS-84위치만 수용합니다; Sokkia SDR20 버전은 그리드 위치만 수용합니다.

프로젝트의 좌표계는 Trimble Survey Controller 파일로 가는 데이터 출력에 영향을 줄 수 있습니다. 데이텀 그리드(예를 들어 NAD83 HPGN과 NADCON)와 다중 회귀 데이텀 변환법은 Trimble Survey Controller 6.50 또는 그 이하의 버전에 의해서 지원되지 않습니다. Trimble Survey Controller 버전 7.00은 데이텀 그리드를 지원합니다.

만일 데이터가 프로젝트에 명시된 데이텀 변환법을 지원하지 않는 Trimble Survey Controller로 내보내지면 만들어진 .dc 파일의 데이텀 레코드는 데이텀 방식이 '없음'으로 표시됩니다. 부정확한 그리드 위치는 Trimble Survey Controller에 나타날 수 없습니다. 더 자세한 내용은 Datum데이텀 변환법과 Trimble Survey Controller 항목을 참고하십시오.

마찬가지로, Trimble Survey Controller 버전 4.00는 지오이드 모델과 작업할 수 없습니다. 만일 프로젝트가 지오이드 모델을 사용하면 데이텀 방식은 또한 '없음'으로 설정됩니다. 이는 Trimble Software Controller 버전 4.00이 부정확한 데이터를 표시할 수 없도록 확실하게 하기 위한 것입니다.

필드에 있는 전송된 그리드 좌표 데이터를 사용하려면 인-필드(in-field) 캘리브레이션을 수행하셔야 그리드 데이터를 관측된 GPS 데이터에 연관 시킬 수 있습니다. 더 자세한 내용은 지오이드 모델과 Survey Controller 항목을 참고하십시오.

파일 내역

기존 .dc 파일의 데이터를 내보내기에 포함시키기 위해서는 [첨가 파일] 확인란을 선택합니다. 그러면 [찾아보기] 단추를 사용할 수 있습니다. 새로운 파일에 포함시키고 싶은 .dc 파일을 찾기 위해서 [찾아보기]를 클릭하십시오. 현재의 프로젝트에서 나온 데이터는 새로운 파일에 첨부됩니다.

내보내기를 원하는 데이터에 첨부하고 싶은 기준점을 포함하고 있는 .dc 파일이 있으면, 이 옵션이 유용합니다. 이 옵션을 사용하면 현재 있는 .dc 파일이 원래 상태로 보관됩니다.


데이터 컬렉터 단위

Trimble Survey Collector 파일 (.dc) 또는 SDR 포맷 파일을 가져올 때, 파일 헤더에 있는 단위 정의는 단위 변환 목적으로 사용됩니다. Trimble Geomatics Office는 항상 내부의 SI (미터법) 데이터로 작동이 되기 때문에, 장치 파일로부터 들어오는 데이터는 적절하게 변환이 됩니다.

그 값이 스크린에 나타나는 방식을 선택하려면:

1.	[파일 / 프로젝트 등록 정보]를 선택합니다.

그러면 [프로젝트 등록 정보] 대화 상자가 나옵니다.

2.	[단위와 포맷] 탭을선택합니다.

표시 단위를 선택하려면 이 탭을 사용하십시오.

참조: SDR파일은 미터와 피트 거리 단위 밖에 없습니다. SDR 파일의 경우, 좌표 단위가 US survey feet로 설정되어 있으면 피트 값은 US survey feet값으로 해석됩니다.


[DC 파일 속성 비고 (Survey Controller V4)] 옵션

속성 비고 파일은 간단한, 콤마 구분형 파일입니다. 그 파일들은 포인트 속성을 포함하고 있는데 그 포인트 속성은Trimble Survey Controller (버전 3.00 또는 4.00)를 사용하는 장치의 속성 비고로서 수집됩니다. 이 옵션은 피쳐와 속성 라이브러리 (Trimble Survey Controller 버전 7.00 또는 그 이상에서 이용가능)를 사용하여 수집하는 속성은 내보내지 않습니다.

이 옵션은 비고 레코드를 사용하여 수집한 속성들만을 내보내기 위하여 사용합니다.

그 과정은 다음과 같습니다.

1.	속성 비고를 포함하고 있는Trimble Survey Controller 버전 3.00 또는 4.00파일을 Trimble Geomatics Office 프로젝트로 가져옵니다.

Trimble Geomatics Office에 의하여 선택 집합가 만들어 집니다. 이 선택 집합는 파일의 내부 작업 이름과 동일한 이름을 갖게 됩니다.

2.	만들어진 선택 집합를 고릅니다. 이 선택 집합는 속성 파일을 위한 프로젝트로부터 포인트를 읽기 위해서 사용됩니다.

3.	.dc 파일을 속성 비고와 함께 내보냅니다.

만들어진 파일 형식의 예는 다음과 같습니다:

1000,5315.362,1056.274,82.361,TREE,TYPE,PINE,HEIGHT,25,GIRTH,0.5

1001,5382.728,1132.692,75.472,TREE,TYPE,BIRCH,HEIGHT,20,GIRTH,0.4

1002,5298.048,1162.472,55.927,PP,VOLTAGE,110KV,CABLES,3

1003,5308.682,1192.329,62.854,PP,VOLTAGE,110KV,CABLES,3


[DTM점을 Survey Controller로] 옵션

DTM 점을 Trimble Survey Controller를 사용하는 장치로 내보내기 위하여 이 옵션을 사용합니다.

그 절차는 다음과 같습니다:

1.	[파일 / 내보내기]를 선택합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭 을 선택 합니다.

3.	[DTM 점을 Survey Controller로] 옵션을 선택합니다.

4.	옵션을 클릭하여 파일의 이름과 이 파일을 받는 Survey Controller의 버전을 지정합니다.

5.	[확인]을 클릭하여 설정을 수용하고 [내보내기] 대화 상자로 돌아갑니다.

6.	[확인]을 클릭합니다. 그러면 [다른 이름으로 저장] 대화 상자가 나옵니다.

내보내기를 위해서 선택된 포인트는 규칙적으로 그리드된 포인트여야 합니다. 즉, 동서와 남북으로 향해있고 각 방향에 있는 포인트 사이에 같은 규격의 공간이 형성되어 있는 그리드 포인트여야 합니다. 전형적으로 그리드된 포인트는 ASCII 좌표 파일로부터 시스템으로 가져오게 됩니다. 주의할 것은 오로지 규칙적으로 그리드된 포인트만이 내보내어질 대상으로 선택되어야 하며, 여분의 '오프-그리드(off-grid)' 포인트는 현재의 선택에 포함되지 않아야 한다는 것입니다.

내보내기 옵션이 선택되면 Trimble Geomatics Office 시스템은 선택된 그리드된 포인트들을 적절한 순서로 정렬하여 Trimble Survey Controller에서 요구하는 특별히 포맷된 파일을 만듭니다.


[DTM 점을 파일(*.dtx)로] 옵션

DTM 점을 DTM파일(*.dtx)로 내보낼 때 이 옵션을 사용합니다.

사용 순서는:

1.	파일 / 내보내기를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[DTM점을 파일 (*.dtx)로] 옵션을 선택합니다.

4.	옵션을 클릭하여 파일의 이름과 이 파일을 받는 Survey Controller의 버전을 지정합니다.

5.	설정을 수용하고 [내보내기] 대화 상자로 돌아가기 위하여 [확인]을 클릭합니다.

6.	[확인]을 클릭하면 [다른 이름으로 저장] 대화 상자가 나옵니다.

7.	파일 이름을 입력하고 저장하려고 하는 폴더를 선택합니다.

8.	[저장]을 클릭합니다.

내보내기를 위해서 선택된 포인트는 규칙적으로 그리드된 포인트여야 합니다. 즉, 동서와 남북으로 향해있고 같은 규격의 공간이 형성되어 있는 그리드 포인트여야 합니다. 전형적으로 그리드된 포인트는 좌표의 ASCII 파일로부터 시스템으로 가져오게 됩니다. 주의할 것은 오로지 규칙적으로 그리드된 포인트만이 내보내어질 대상으로 선택될 수 있으며, 여분의 '오프-그리드(off-grid)' 포인트는 현재의 선택에 포함되지 않아야 한다는 것입니다.

내보내기 옵션이 선택되면 Trimble Geomatics Office 시스템은 선택된 그리드된 포인트를 적절한 순서로 정렬하여 DTM (*.dtx) 포맷의 파일을 만듭니다.


[데이텀 그리드를 Survey Controller (*.cdg)로] 옵션

기타

Trimble Survey Controller로 보내는 결합 데이텀 그리드 파일을 만들기 위하여 이 옵션을 사용합니다.

사용 방법은:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[데이텀 그리드를 Survey Controller (*.cdg)로] 옵션을 선택합니다.

[데이텀 그리드 내보내기] 대화 상자가 나옵니다.

데이텀 그리드 파일은 정의된 영역에 데이텀 그리드 변환을 저장합니다. Trimble Coordinate System Manager� 유틸리티를 이용하여, 데이텀 그리드 파일을 데이텀 변환 시스템으로 (예:NADCON) 사용하는 좌표계를 정의할 수 있습니다. 그리고 나서 Trimble Geomatics Office 프로젝트를 위해 데이텀 그리드를 사용하는 좌표계를 선택할 수 있습니다. 현장에서 데이텀 그리드 파일을 사용하기 위하여는 데이텀 그리드 파일을 결합 데이텀 그리드 파일 형식으로 Trimble Survey Controller (버전 7.00 또는 그 이상)로 전송 하셔야 합니다. 각각의 다른 데이텀 변환법을 서로 다른 Trimble Survey Controller 버전 중 어느것에 이용할 수 있는지에 대해서는, 데이텀 변환과 Survey Controller를 참조하십시오.

선택된 데이텀 그리드를 위한 경도 그리드 파일과 위도 그리드 파일은 Program Files\Common Files\Trimble\Geodata 폴더에 있습니다. 이 파일들은 Trimble Survey Controller로 내보내기 전에 결합되어야만 합니다. [Survey Controller로 내보낼 결합 데이텀 그리드 파일 만들기]를 선택하면, 소프트웨어가 프로젝트의 좌표계에 지정된 데이텀 그리드와 관련된 파일들을 결합합니다.

결합 데이텀 그리드 파일을 만들고 그것을 Trimble Survey Controller와 함께 사용하면, 원래의 데이텀 그리드 이름이 .dc 파일에 저장 됩니다. 예:NADCON (HPGN).

.dc파일을 Trimble Geomatics Office로 가져오면, 현장에서 사용된 좌표계가 Trimble Goematics Office 프로젝트에서 정의된 좌표계와 일치하는지를 결정할 때 이 파일 이름이 사용됩니다.

참조: 결합 데이텀 그리드 파일은 현재 사용중인 데이텀 그리드 파일에서만 만들 수 있습니다. 그러나 어떠한 결합 데이텀 그리드라도 '내보내기'를 할 수 있습니다.

다음과 같이 할 수 있습니다:

  기존 결합 데이텀 그리드 (.cdg) 파일을 전송할 수 있습니다.

  Trimble Survey Controller로 전송하기 위하여 새로운 결합 데이텀 그리드 (.cdg) 파일을 만들 수 있습니다.

참조: 데이텀 그리드 파일을 결합하기 위하여 Trimble Grid Factory� 유틸리티를 사용할 수도 있습니다. Grid Factory 유틸리티를 설치하기 위해서는 Trimble Geomatics Office 사용자 설치 옵션을 사용합니다.


데이텀 변환과 Trimble Survey Controller

Trimble Geomatics Office는 데이텀 변환을 하기 위하여, 데이텀 그리드와 다중 회귀 정의의 사용을 지원합니다.

이 데이텀 변환법을 사용하는 많은 수의 좌표계 정의가 본 소프트웨어에 딸려 있는 좌표계 데이터 베이스에 제공되어 있습니다.

Trimble Survey Controller 7.00 이하의 버전은 이 데이텀 변환 종류의 어느 것도 지원하지 않습니다. Trimble Survey Controller 버전 7.00은 데이텀 그리드를 지원합니다.

Trimble Geomatics Office는 다음 파일들을 만들 수 없습니다:

  이 데이텀 변환법의 어느 하나를 참조하는 버전 6.50 또는 그 이하의 Trimble Survey Controller .dc 파일

  다중 회귀법 데이텀 변환을 참조하는 버전 7.00의Trimble Survey Controller .dc 파일

지원되지 않는 방식을 사용하는 프로젝트로부터 포인트가 Trimble Survey Controller .dc 파일로 내보내질 때,Trimble Geomatics Office는 방식을 [없음]에 설정하고 데이텀 기록을 출력 합니다.

이것은Trimble Survey Controller에서는 WGS-84와 그리드 위치 간에 포인트 보기를 바꿀 수 없다는 사실을 의미합니다. 또한 이 포인트를 사용하여 더 이상의 현장작업을 수행하기 전에 그리드 위치가 전송되었다면, 현장작업에서 캘리브레이션을 수행해야 한다는 뜻입니다.

만일 그리드 위치가 캘리브레이션 목적으로 전송되었다면 이것은 문제가 되지 않습니다. 만일 WGS-84 위치가 전송된다면 즉시 세팅을 하셔도 됩니다. 그러나 인필드(in-field) 캘리브레이션이 수행되지 않으면 그리드 좌표를 볼 수는 없습니다.


[데이텀 그리드 내보내기] 대화 상자

데이텀 그리드 (*.cdg) 파일을 내보내려면 이 옵션을 사용합니다:

이 기능을 이용하려면:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[데이텀 그리드를 Survey Controller (*.cdg)로] 옵션을 선택합니다.

4.	[확인]을 클릭합니다. [데이텀 그리드 내보내기] 대화 상자가 나옵니다.

기존의 결합 데이텀 그리드 파일을 Survey Controller로 내보내기

결합 데이텀 그리드 파일을 Trimble Survey Controller (버전 7.00 또는 그 이상)로 내보내기 위하여 이 옵션을 선택합니다. GeoData 폴더에 있는 결합 데이텀 그리드 파일 중 어느 것이라도 내보낼 수 있습니다. 이 옵션을 선택하면 [선택] 대화 상자가 나옵니다.

Survey Controller로 내보낼 결합 데이텀 그리드 파일 만들기

현 프로젝트 좌표계가 사용하는 데이텀 그리드 파일을 가지고 새 결합 데이텀 그리드 파일을 만들기 위하여 이 옵션을 선택합니다. 그러면 [결합 데이텀 그리드 파일 만들기] 대화 상자가 나옵니다.


다른 이름으로 저장하기(데이텀 그리드 / 지오이드 그리드 내보내기)
[다른 이름으로 저장] 대화 상자 (데이텀 그리드 / 지오이드 그리드 내보내기)

결합 데이텀 그리드 (*.cdg) 파일 또는 지오이드 그리드 (*.ggf) 파일에 이름을 입력하기 위하여 이 대화 상자를 사용합니다.

[확인]을 클릭하면 Data Transfer의 [다른 이름으로 저장] 대화 상자가 나옵니다.


[결합 데이텀 그리드 파일 만들기] 대화 상자

[결합 데이텀 그리드] (*.cdg) 파일을 만들기 원하는 영역을 정의하기 위하여 이 대화 상자를 사용합니다. 그 다음, 현장에서 사용하도록 Trimble Survey Controller로 결합 데이텀 그리드 파일을 보낼 수 있습니다.

프로젝트 좌표계는 .cdg파일을 만들기 위하여 그 좌표계의 데이텀 그리드를 사용하여야 합니다. 데이텀 그리드 파일을 사용하는 방법을 더 알기 원하면 Trimble Coordinate System Manager� 유틸리티 온라인 도움말을 참조하십시오.

이 기능을 이용하려면,

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[데이텀 그리드를 Survey Controller로] 옵션을 선택합니다.

4.	[확인]을 클릭하면 [데이텀 그리드 내보내기] 대화 상자가 나옵니다.

5.	[Survey Controller로 내보낼 결합 데이텀 그리드 만들기]를 선택합니다.

6.	[확인]을 클릭합니다.

지구체에 있는 노란색 상자는 위도와 경도 데이텀 그리드 파일에 의해 카바되는 영역을 정의합니다.

도구를 사용하여 데이텀 그리드 안에 있는 지구체 표면 위에 해당 결합 데이텀 그리드가 포함하기를 바라는 네모 상자를 그립니다.

파일 등록 정보

[파일 등록 정보] 상자는 .cdg 파일을 만들기 위하여 사용 중인 파일들을 보여줍니다.

데이텀 그리드

.cdg파일을 만들기 위하여 사용되는 데이텀 그리드 파일을 보여줍니다.

위도 그리드 파일

.cdg 파일을 만들기 위하여 사용되는 위도 그리드 파일을 보여줍니다.

경도 그리드 파일

.cdg 파일을 만들기 위하여 사용되는 경도 그리드 파일을 보여줍니다.

그리드 등록 정보

[그리드 등록 정보] 상자는 정의되고 있는 그리드의 등록 정보를 보여줍니다.

위도 범위

현재 상자의 위도 범위를 표시합니다.

경도 범위

현재 상자의 경도 범위를 표시합니다.

파일 크기

만들어지는 .cdg 파일의 크기를 표시합니다. 파일 크기 값은 지구체 위의 상자의 모양에 따라 달라집니다.

Survey Controller 이름

Trimble Survey Controller에서 사용될 .cdg파일의 내부 이름을 보여줍니다. Survey Controller 이름 필드에는 원래의 데이텀 그리드의 이름이 나옵니다. 만일 .cdg 파일이 Trimble Survey Controller 작업에서 사용 중이면 내부 이름이 참조됩니다. 데이터 컬렉터 (*.dc) 파일을 가져오는 동안 Trimble Geomatics Office는 내부 이름을 사용하여 .dc 파일에서 사용되고있는 결합 데이텀 그리드가 Trimble Geomatics Office 프로젝트를 위한 데이텀 그리드와 부합되는지 결정합니다.

참조: 이 필드를 편집할 경우, 이름의 앞과 뒤에만 첨부할 수 있음을 명심하셔야 됩니다. 이것은 그 이름이 유일한 것임을 확인해 주며, '가져오기' 에서 원래의 데이텀 그리드가 인식될 수 있도록 해줍니다. Survey Controller 이름 필드가 해당 데이텀 그리드의 이름을 포함할 때까지는 진행할 수 없습니다.

지구체 등록 정보

[지구체 등록 정보] 상자는 커서 위치를 보여주며 지구체의 모양을 구성하기 위한 옵션을 제공합니다.

커서의 좌표

지구체 안에서 마우스 포인터의 현재 위도와 경도 위치를 보여줍니다.

주경계선 표시

지구체에서 주경계선을 표시하기 위해 이 확인란을 선택합니다.

국경선 표시

지구체에서 국경선을 표시하기 위해 이 확인란을 선택합니다

강 표시

지구체에서 강을 표시하기 위해 이 확인란을 선택합니다.


[Geoid 파일을 Survey Controller로(*.ggf)] 옵션
[지오이드 파일을 Survey Controller로(*.ggf)] 옵션

추가 정보

방법 ...	대화 상자	기타
개요

지오이드 그리드 (*.ggf) 파일은 WGS-84 타원체와 정의된 영역에 대한 지오이드 사이의 분리 간격을 저장합니다. 지오이드 모델에 대한 정보를 아시려면 지오이드 모델 - 개요를 참조하십시오.

만일 .ggf 파일이 Trimble Geomatics Office 프로젝트 좌표계의 일부로 사용되면, GPS 포인트에 대한 표고 근사치가 계산 됩니다. 현장에서 .ggf 파일을 사용하려면, Trimble Geomtaics Office를 이용하여 Trimble Survey Controller (버전 6.00 또는 그 이상)으로 .ggf 파일을 전송합니다.

사용 방법은:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[Geiod 파일을 Survey Controller로] 옵션을 선택합니다.

[지오이드 모델 내보내기] 대화 상자가 나옵니다.

이 옵션을 사용하여 다음을 실행할 수 있습니다:

  Program files \ Common files \ Trimble \ GeoData 폴더에  .ggf 파일 전송하기

  더 작은 지오이드 그리드 파일을 얻기 위하여 현재의Trimble Geomatics Office 프로젝트에서 쓰는 .ggf 파일을 서브 그리드 하여 소규모의 지오이드 그리드 파일 추출하기.  이 과정은 Trimble Survey Controller (버전 6.00 또는 그 이상)를 사용 중인 TSC1 장치로 보내는 .ggf 파일의 크기를 축소 시킵니다.

Trimble Survey Controller의 다른 버전들에 대한 지오이드 모델 지원에 대해 알아보려면 지오이드 모델과 Survey Controller 를 참조하십시오.

서브 그리드로 새로운 .ggf 파일을 만들 때 원래 지오이드 모델의 이름이 저장됩니다 (예:GEOID96 Conus). 이 내부 이름은 또한 서브 그리드된 .ggf 파일을 사용하는 .dc 파일에 포함됩니다. .dc파일을 가져오는 동안, 현장에서 사용된 지오이드 모델이 Trimble Geomatics Office 프로젝트에 정의된 지오이드 모델과 일치하는지를 결정하기 위하여 Trimble Geomatics Office는 이 이름을 사용합니다.

참조: 지오이드 모델 파일을 서브 그리드 하기위해 Grid Factory 유틸리티를 사용할 수도 있습니다. 이 유틸리티는 Trimble Geomatics Office를 설치할 때 사용자 옵션 중의 하나입니다.


[지오이드 파일을 TDS Survey Pro CE로 (*.ggf)] 옵션

추가 정보

방법 ...	대화 상자	기타
개요

지오이드 그리드 (*.ggf) 파일은 WGS-84 타원체와 정의된 영역에 대한 지오이드 사이의 분리 간격을 저장합니다. 지오이드 모델에 대한 정보를 아시려면 지오이드 모델 - 개요를 참조하십시오.

만일 .ggf 파일이 Trimble Geomatics Office 프로젝트 좌표계의 일부로 사용되면, GPS 포인트에 대한 표고 근사치가 계산 됩니다. 현장에서 .ggf 파일을 사용하려면, Trimble Geomtaics Office를 이용하여 TDS Survey Pro CE (v3.5 이상)으로 .ggf 파일을 전송합니다.

그 방법은:

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[Geiod 파일을 TDS Survey Pro CE로] 옵션을 선택합니다.

[지오이드 모델 내보내기] 대화 상자가 나옵니다.

이 옵션을 사용하여 다음을 실행할 수 있습니다:

  Program files\Common files\Trimble\GeoData 폴더에  .ggf 파일 전송하기

  더 작은 지오이드 그리드 파일을 얻기 위하여 현재의Trimble Geomatics Office 프로젝트에서 쓰는 .ggf 파일을 서브 그리드하여 소규모의 지오이드 그리드 파일 추출하기. 이 과정은 TDS Survey Pro CE (v3.5 이상)를 사용 중인 TSCE 장치로 보내는 .ggf 파일의 크기를 축소 시킵니다.

참조: 지오이드 모델 파일을 서브 그리드 하기위해 Grid Factory 유틸리티를 사용할 수도 있습니다. 이 유틸리티는 Trimble Geomatics Office를 설치할 때 사용자 옵션 중의 하나입니다.


지오이드 모델과 Trimble Survey Controller

지오이드 모델은 Trimble Survey Controller 버전 6.00 (또는 그 이상)으로 전송될 수 있습니다. Trimble Survey Controller는 WGS-84의 위치와 그리드 (NEE)의 위치 사이에 포인트 표시가 바뀔 때 이 지오이드 모델을 사용합니다.

대체로 지오이드 모델은 매우 큰 파일입니다. 보통, 완전한 지오이드 모델을 Trimble Survey Controller 버전 6.00 (또는 그 이상)으로 업로드 시키는 것은 불가능 합니다.

사용자의 영역에 더 작은 지오이드 모델을 만들려면 [파일 / 내보내기] / Geoid 파일을 Survey Controller로 옵션을 사용합니다. 그 후에 더욱 작아진 파일을 Trimble Survey Controller로 전송할 수 있습니다.

Trimble Survey Controller 낮은 버전

다음 내용은 낮은 버전의 Trimble Survey Controller와 관계가 있습니다.

버전 5.00

군용 버전으로 일반인에게는 시판되지 않습니다.

버전 4.00

이 버전은 지오이드 모델과 작업할 수 없습니다. 만일 Trimble Geomatics Office가, 그리드 혹은 WGS-84 포인트로서의 포인트 위치가 뒤따르는 완전한 좌표계 정의를 Trimble Survey Controller 버전 4 .dc 파일에 내보내기 위해 작성한다면, Trimble Survey Controller에는 타원체고/표고가 부정확하게 나타날 수 있습니다.

이것은 데이터 화면이 바뀌었을 때 Trimble Survey Controller 안에서 일어납니다. 그리드 위치가 전송이 되면서  WGS-84고가 부정확하게 나타나고, WGS-84 위치가 전송이 되면서 그리드 포인트 표고가 부정확하게 나타납니다.

이런 일의 발생을 피하기 위하여 Trimble Geomatics Office는 프로젝트 정의로부터 데이텀 레코드를 출력합니다. 그리고 나서 지오이드 모델로 인해서 NEE와 WGS-84 값 사이에 변환이 불가능하다는 것을 경고 해주고, 또 공백값의 변환이 추가되었다고 알려줍니다. 그 후에 방식이 None에 맞추어진 또 다른 데이텀 레코드가 나옵니다. 나중의 데이텀 레코드는 항상 이전의 데이텀 레코드 위에 덮어씁니다. 따라서 Trimble Survey Controller 버전 4.00의 경우, WGS-84와 그리드 위치 간에 포인트 보기를 바꿀 수 없습니다. 이는 어떤 잘못된 값이 표시되지 않도록 하기 위한 것입니다.

현장 작업에서 이것은 그리드 위치를 업로드하려면 캘리브레이션을 해야 한다는 것을 의미합니다. 이 포인트를 사용하여 어떠한 새 현장 작업을 하기 전에 캘리브레이션을 하셔야 합니다. (그리드 위치가 캘리브레이션을 위해 이미 전송된 경우에는 이것은 문제가 안됩니다.)

참조: 만일 WGS-84 위치가 전송된다면 즉시 세팅을 하셔도 됩니다. 그러나 인필드 캘리브레이션이 수행되지 않으면 그리드 좌표를 볼 수는 없습니다.

버전 4 이하의 버전

버전 4 이하의 Trimble Survey Controller는 WGS-84 위치의 업로딩 만을 할 수 있습니다. 그렇기 때문에 지오이드 모델의 사용으로 인하여 프로젝트에서 영향을 받지 않습니다.


[지오이드 모델 내보내기] 대화 상자

[지오이드 파일을 Survey Controller로(*.ggf)] 옵션이나 [지오이드 파일을 TDS Survey Pro CE로(*.ggf)] 옵션을 선택하면, [지오이드 모델 내보내기] 대화 상자가 나옵니다.

기존 지오이드 모델을 Survey Controller로 내보내기

지오이드 그리드 파일을 Trimble Survey Controller(버전 6.00 또는 그 이상)나 TDS Survey Pro CE 버전 4 이상으로 내보내려면 이 옵션을 선택합니다. GeoData 폴더에 있는 지오이드 그리드 파일 중 어느것이라도 이 방법으로 내보낼 수 있습니다. 이 옵션을 선택하면 [선택] 대화 상자가 나옵니다.

지오이드 모델의 서브 그리드를 만들어 Survey Controller로 내보내기

현재의 프로젝트 좌표계에서 사용하는 지오이드 그리드 파일을 서브 그리드 하려면 이 옵션을 선택합니다. 그러면 [지오이드 그리드 파일 만들기] 대화 상자가 나옵니다.


[지오이드 그리드 파일 만들기] 대화 상자

새 지오이드 그리드 파일을 만들려고 하는 영역을 정의하기 위하여 이 대화 상자를 사용합니다. 이 파일은 프로젝트 좌표계에서 사용되는 지오이드 그리드 파일에 기초를 두고 있습니다.

이 기능을 이용하려면,

1.	[파일 / 내보내기]를 선택하면 [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[지오이드 파일을 Survey Controller로 (*.ggf)] 옵션이나 [지오이드 파일을 TDS Survey Pro CE로(*.ggf)] 옵션을 선택합니다.

4.	[확인]을 클릭합니다.  [지오이드 모델 내보내기] 대화 상자가 나옵니다.

5.	[지오이드 모델의 서브 그리드를 만들어 내보내기] 옵션을 선택합니다.

6.	[확인]을 클릭합니다.

지구체에 있는 노란색 상자는 지오이드 모델에 의해 카바되는 영역을 정의합니다.

도구를 사용하여 지오이드 모델 안에 있는 지구체 표면 위에 해당 지오이드 그리드가 카바하기를 바라는 크기의 박스를 그립니다. 그러면 이 때 그린 박스의 파일 크기가 숫자로 나타납니다.

파일 등록 정보

[파일 등록 정보] 상자는 .ggf 파일을 만들기 위하여 사용되는 지오이드 그리드 파일에 등록 정보를 보여줍니다.

지오이드 모델

프로젝트 좌표계에서 사용되는 지오이드 모델을 표시합니다.

지오이드 그리드 파일

지오이드 모델에서 사용되는 지오이드 그리드 파일 이름을 표시합니다.

그리드 등록 정보

[그리드 등록 정보] 상자는 정의되고 있는 그리드의 등록 정보를 보여줍니다.

위도 범위

현재 상자의 위도 범위를 표시합니다.

경도 범위

현재 상자의 경도 범위를 표시합니다.

파일 크기

만들어질 지오이드 그리드 파일의 크기를 표시합니다. 지구체위에 그리는 상자의 모양에 따라 [파일 크기] 값이 달라집니다.

이름

Trimble Survey Controller나 TDS Survey Pro CE 소프트웨어에서 사용될 서브 그리드 파일의 내부 이름을 표시합니다. [Survey Controller 이름] 필드에는 지오이드 모델의 원래 이름이 사용됩니다. 해당 .ggf 파일이 Trimble Survey Controller 작업에서 사용될 경우 내부 이름이 참조됩니다. 데이터 컬렉터 (*.dc) 파일을 가져오는 동안 Trimble Geomatics Office는 내부 이름을 사용하여 .dc 파일에서 사용되고있는 지오이드 모델이 Trimble Geomatics Office 프로젝트를 위하여 정의된 지오이드 모델과 부합되는지 결정합니다.

참조: 이 필드를 편집할 경우, 이름의 앞과 뒤에만 첨부할 수 있음을 명심하셔야 됩니다. 이것은 그 이름이 유일한 것임을 확인해 줌과 동시에, 가져오기 작업에서 원래의 지오이드 모델이 인식될 수 있도록 해줍니다. [Survey Controller 이름] 필드가 지오이드 모델의 이름을 포함할 때 까지 이 작업을 계속할 수 없습니다.

지구체 등록 정보

[지구체 등록 정보] 상자는 커서 위치를 보여주고 지구체에 모양을 설정하기 위한 옵션을 제공합니다.

커서의 좌표

지구체 안에 있는 마우스 포인터의 현 위도와 경도의 위치를 표시합니다.

주경계선 표시

지구체에 주경계선을 표시하기 위해 이 확인란을 선택합니다.

국경선 표시

지구체에 국경선을 표시하기 위해 이 확인란을 선택합니다.

강 표시

지구체에 강을 표시하기 위해 이 확인란을 선택합니다.

참조: 지오이드 모델 파일을 서브 그리드 하기위해 Trimble Grid Factory 유틸리티를 사용할 수도 있습니다. Grid Factory 유틸리티는 Trimble Geomatics Office를 설치할 때 사용자 옵션 중 하나입니다.


[피쳐 및 속성 라이브러리를 Survery Controller로(*.fcl)] 옵션

 개요 및 추가 정보

피쳐 및 속성 라이브러리를 Trimble Survey Controller로 내보내려면:

1.	[파일 / 내보내기]를 선택합니다. [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[피쳐 및 속성 라이브러리를 Survey Controller로(*.fcl)] 옵션을 선택합니다.

그러면 [피쳐 및 속성 라이브러리 선택] 대화 상자 가 나옵니다.

피쳐 및 속성 라이브러리를 Trimble Survey Controller로 내보내기 위하여 이 옵션을 사용합니다. 그러면 현장에서 피쳐 코드를 수수집할 수 있게 됩니다. 또한 피쳐 및 속성 라이브러리를 사용하여 속성이 정의된 피쳐코드의 속성을 수집할 수 있습니다.


[피쳐 및 속성 라이브러리 선택] 대화 상자

Survey 장치로 전송하려고 하는 피쳐 및 속성 라이브러리를 선택하기 위하여 이 대화 상자를 사용합니다.

찾아보기

라이브러리를 선택하기 위하여 [찾아보기]를 클릭합니다.

파일

[파일] 필드 기본값은 마지막으로 내보내어진 파일의 이름입니다.

속성 내보내기

Trimble Survey Controller 버전 7.00 이상으로 내보낼 경우만 이것을 할 수 있습니다. 피쳐 및 속성 라이브러리에 있는 속성 정의를 내보내려면 이 확인란을 선택합니다.

현장에서 속성 정보를 수집하려면 이 옵션을 사용합니다. 이 확인란을 해제하면 라이브러리 파일에 정의된 어떠한 속성도 내보내어지지 않습니다. Trimble Survey Controller 버전 6.50 이하로 내보낼 경우에는 이 필드를 이용할 수 없습니다.

확인

적절한 피쳐 및 속성 라이브러리를 선택한 후 [확인]을 클릭합니다.

Data Transfer의 [다른이름으로 저장] 대화 상자가 나옵니다.

참조: 제어 코드도 Trimble Survey Controller 에 내보내어 집니다.


[피쳐 및 속성 라이브러리 옵션] 대화 상자

내보내기 작업 시 수신처인 Trimble Survey Controller의 버전을 설정하기 위하여 이 대화 상자를 사용합니다.

이 기능을 이용하려면,

1.	[파일 / 내보내기]를 선택합니다. [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[피쳐 및 속성 라이브러리를 Survey Controller로] 옵션을 선택합니다.

4.	[옵션]을 클릭합니다.

버전

Trimble Survey Controller 7.00 이하의 버전을 선택하면 [피쳐 및 속성 라이브러리 선택] 대화 상자에 있는 [속성 내보내기] 확인란을 이용할 수 없습니다. 7.00 이하의 버전들은 속성을 지원하지 않기 때문입니다.


[데이터 딕셔너리를 Survey Controller로 (*.ddf)] 옵션

 개요 및 추가 정보

Trimble Survey Controller 버전 7.00 또는 그 이상의 버전으로 데이터 딕셔너리 파일을 내보내려면 이 옵션을 사용합니다. Trimble Survey Controller에서 속성을 수집하기 위하여 데이터 딕셔너리 파일을 사용합니다.

Trimble Survey Controller로 데이터 딕셔너리 파일을 내보내려면:

1.	[파일 / 내보내기]를 선택합니다. [내보내기] 대화 상자가 나옵니다.

2.	측량] 탭을 선택합니다.

3.	[데이터 딕셔너리를 Survey Controller로(*.ddf)] 옵션을 선택합니다.

4.	[확인]을 클릭합니다.

[선택] 대화 상자가 나옵니다.


[선택] 대화 상자 (데이터 딕셔너리 파일을 Trimble Survey Controller 소프트웨어로 내보내기)
[선택] 대화 상자 (데이터 딕셔너리 파일을 Trimble Survey Controller로 내보내기)

Trimble Survey Controller로 전송하려고 하는 데이터 딕셔너리 (*.ddf) 파일을 선택하려면 이 대화 상자를 사용합니다.

[열기]를 클릭하면, Data Transfer의 [다른이름으로 저장] 대화 상자가 나옵니다.


Trimble Survey Controller 소프트웨어로부터 데이터 전송 - 개요
Trimble Survey Controller로부터 데이터 전송 - 개요

 방법 ...

개요

Trimble Survey Controller를 사용중인 장치에 연결하여 Trimble Geomatics Office로 작업을 전송할 수 있습니다. 데이터가 들어오면서, 작업들은 데이터 컬렉터 (*.dc) 파일로 바뀝니다. 이렇게 하기 위하여는 반드시 Trimble Data Transfer 유틸리티에 Survey Controller 장치 설정이 있어야 합니다.

참조: 어떤 작업에 그와 관련된 Trimble GPS 원시 데이터 (*.dat) 파일이 있으면 가져오기 작업을 할 때 .dat 파일이 함께 옵니다. .dat 파일이 같은 프로젝트로 두번 이상 들어오면, 그 프로젝트에 있는 현재의 선점이 [DAT 체크인] 대화 상자에서 기본값으로 선택되지 않습니다.

.dc 파일의 [가져오기] 작업을 하는 동안, Trimble Geomatics Office는, Trimble Survey Controller에서 각각의 포인트에 부여한 등급와, 해당 포인트에 질 을 부여하기 위하여 포인트의 위치를 결정하는 데 사용한 방법을 그대로 사용합니다. 재계산은 해당 포인트의 계산된 위치를 결정하기 위해 등급을 이용합니다.

참조: Trimble Survey Controller 버전 7.60와 서로 데이터를 전송하는 경우, 버전 7.50 .dc 파일 포맷을 이용하도록 합니다.

참조: Trimble Survey Controller로부터 다운로드한 데이터를 사용하여 망 조정을 수행하려면, 측량을 할 때 Survey Controller 측량 스타일에서 기압, 온도, 곡률 및 굴절 보정을 입력해야 합니다.


비고 레코드 - 개요

프로젝트에 있는 비고는 사용자가 Trimble Survey Controller에로부터 입력한 비고입니다. '초기화 얻음' 또는 '초기화 잃음'과 같은 측량 정보 비고는 프로젝트에 들어가지 않습니다.

비고 레코드는 Trimble Survey Controller의 구 버전들에서 다음과 같은 목적으로 사용됩니다:

만약 구 버전의 Trimble Survey Controller를 사용하는 중 비고 레코드를 이용하기 원하면, 프로젝트에 있는 모든 비고 레코드를 선택하기 위하여 선택 / 종류기준 대화 상자를 고릅니다.


Sokkia 데이터 레코더 파일(*.sdr)

Trimble Geomatics Office는 Sokkia 데이터 레코더 파일 (*.sdr) 포맷의 데이터를 지원합니다.

Trimble Geomatics Office를 사용하여 할 수 있는 내용은 다음과 같습니다.

  Sokkia 데이터 레코더 파일 (*.sdr)을 Trimble Geomatics Office 프로젝트로 가져오기

  Trimble Geomatics Office 프로젝트를 Sokkia 데이터 레코더 파일 (*.sdr)로 내보내기

Sokkia 데이터 레코더 파일 (*.sdr)을 가져오려면:

1.	[파일 / 가져오기]를 선택합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다.

3.	[Sokkia 데이터 레코더 파일 (*.sdr)] 옵션을 선택합니다. [열기] 대화 상자가 나옵니다.

4.	가져오기를 원하는 파일을 폴더에서 선택하고 [열기]를 클릭합니다.

현재의 Trimble Geomatics Office 프로젝트를 Sokkia 데이터 레코더 파일 (*.sdr)로 내보내려면:

1.	파일 / 내보내기를 선택합니다. [내보내기] 대화 상자가 나옵니다.

2.	[측량] 탭을 선택합니다

3.	[SDR 파일 (*.sdr)] 옵션을 선택합니다.

4.	[옵션]을 클릭하고 [데이터 컬렉터 옵션] 대화 상자를 엽니다. 파일의 내부이름과 Sokkia 데이터 레코더 파일 버전을 명시합니다.

5.	설정을 수용하고 [내보내기] 대화 상자로 돌아가기 위하여는 [확인]을 클릭합니다.

6.	[확인]을 클릭합니다. [다른 이름으로 저장] 대화 상자가 나옵니다.


UK National Grid 파일을Trimble Survey Controller소프트웨어로 전송
 UK National Grid 파일을Trimble Survey Controlle로 전송

 방법 ...

Trimble Survey Controller 버전 7.5 또는 그 이상으로 UK National Grid 투영법 그리드 파일(*.pgf)를 직접 전송하려면 Trimble Data Transfer 유틸리티를 사용합니다.

Program Files\Common Files\Trimble\Geodata 폴더에 위치한 기존의 .pgf 파일은 어느 것이라도 전송할 수 있습니다.

참조: 이 내보내기 옵션은 Trimble 데이터 전송 유틸리티가 독립형의 모드로 사용될 때만 이용할 수 있습니다. 이 옵션은Trimble Geomatics Office [내보내기] 대화 상자로부터는 사용할 수 없습니다.


필드 필인 - 개요
필드 필인 − 개요

추가 정보

 방법 ...

개요

필드 필인(Field fill-in) 기능을 이용하여 필드에 값을 입력할 수 있습니다. 일례로, 어떤 레이어 필드를 입력함에 있어, 해당 레이어에 속하는 포인트를 클릭하는 방법으로 처리할 수 있습니다.

필드 필인이 가능한 필드에서는 그래픽 창의 포인터가 다음과 같이 나타납니다.

참조: 그래픽 창의 선택 개체가 해당 필드에 필요한 값을 제공하지 못할 경우, 그 대화 상자의 필드는 영향을 받지 않고 원래 상태를 그대로 유지합니다.

어떤 필드는 값이 그룹 단위로 기재(fill-in)되므로 단 한 번의 클릭으로써 모든 그룹 필드가 채워집니다. 예를 들어, Y 좌표 필드와 X 좌표 필드, 표고 필드는 한 그룹을 형성하는 것이 일반적입니다. 그 중 한 필드만 기재하고자 하면 해당 필드를 선택하고 Alt키를 누른 상태에서 클릭을 합니다.

일단 어떤 필드 필인을 하고 나면 Trimble Geomatics Office의 포커스는 다음의 빈 필드로 이동합니다.

특수한 필드 필인 기능

필드 필인은 다음과 같은 특수한 기능이 있습니다.

  방위각 필드를 기재할 때, 역 방위각 값을 입력하려면 Shift키를 누른 채 클릭을 합니다. 방위각 및 거리로 포인트를 추가하는 경우에는 방위각 필드에서 이 필드 필인 기능을 이용할 수 없습니다.

  필드 필인 기능의 이용시 Ctrl키를 누르면, 개체로 스냅(snapping)되는 일을 방지하고 좌표만 선택할 수 있습니다. 따라서 어떤 개체에 인접한 좌표를 선택할 수 있게 됩니다.

  필드 필인에 필요한 값이 있는 개체를 찾아내려면 [보기] 메뉴의 명령(예: [확대/축소] 명령이나 [이동] 명령)을 이용합니다. 일단 이를 찾게 되면, 그 값을 복사하기 전에 반드시 포커스를 해당 필드로 복귀시켜야 합니다.


각도 입력하기

소수점 아래의 숫자는 각도나 단위, 포맷의 설정 여하에 따라 그 의미가 달라집니다.

포맷은 [프로젝트 등록 정보] 대화 상자의 [단위와 포맷] 탭 하에서 설정합니다.

예:

입력 숫자가 10.1234인 경우


단위 변환

단위가 있는 필드의 표시 단위(예: 화면 출력 단위, 가져오기 단위, 내보내기 단위, 보고서 단위)를 설정하려면 [프로젝트 등록 정보] 대화 상자의 [단위와 포맷] 탭을 이용합니다.

어떤 필드에 입력된 수치값은 시스템의 설정 단위 여하에 따라 그 의미가 달라집니다. 예를 들어, 표고의 설정 단위가 m인 경우, 표고 필드에 입력되는 수치는 모두 m 값이 됩니다.

수치값에 이어 알파벳 문자를 직접 입력하는 경우에는 이 설정에 우선하여 적용됩니다.

어떤 단위를 명시함으로써 다른 값을 입력할 수 있습니다. 예를 들어, 표고를 '25 sft'라 입력하면 Trimble Geomatics Office는 그 단위를 US Survey Feet로 인식하게 됩니다.

다음은 이에 대한 요약표입니다.


개체 끌기

선택한 개체를 마우스로 이동 또는 회전시키려면 편집 핸들을 이용합니다.

예를 들어, 주석에 담긴 정보를 보다 효과적으로 제시하고 메인 그래픽 창의 레이아웃을 더 잘 하고자 할 때 그 주석의 위치를 변경할 수 있습니다.

텍스트/주석

텍스트나 주석 개체를 끌고자 하면 그 텍스트나 주석(또는 둘 다)을 선택한 다음, 마우스 포인터를 텍스트의 프레임상으로 이동하여 핸들 2개 중 하나를 찾습니다. 마우스 포인터를 핸들에 위치시키면 그 포인터가 적절한 아이콘으로 바뀝니다. 끌기 포인터로는 개체를 드래그하고, 회전 포인터로는 개체를 회전시킵니다.

예:

필요한 편집 핸들을 선택하고 끕니다. 마우스 단추를 놓는 위치가 그대로 유지됩니다.

참조: 우측 앵커 형(anchor type)이 아니라면 회전 핸들은 오른쪽 위 위치에 있게 됩니다. 우측 앵커 형을 선택하면 회전 핸들은 왼쪽 위 위치에 있게 됩니다.

편집 핸들의 위치는 다음과 같습니다.

참조: 하단선은 디센더(descender)가 없는 문자의 가장 낮은 위치를 말합니다. 즉, 위의 그림에서 하단선과 제일 아래 선 사이의 공간은 소문자의 디센더가 위치하게 되는 영역입니다.

곡선

곡선의 진입 접선과 퇴출 접선을 변경하려면 곡선(들)을 선택한 다음, 이 선택 부분으로 마우스 포인터를 이동하여 회전 핸들을 찾습니다. 각 곡선에는 핸들이 2 개씩(진입 접선 핸들과 퇴출 접선 핸들) 있습니다.

포인터는 편집 핸들에 위치하게 되면 [image] 로 바뀝니다.

회전 포인터로는 선택한 곡선(들)을 회전시킵니다.

참조: 두 개의 곡선이 서로 연결된 경우에는 편집 핸들 하나로 양 곡선을 모두 회전시킬 수 있습니다. Trimble Geomatics Office는 연결 곡선간의 공통 접선을 설정하고 이를 자동으로 계속 유지해 갑니다.

기존 개체로 스냅(snap)되도록 하려면 Ctrl키를 누릅니다. 달리 설정하지 않는 한, 기존 개체로의 이 스냅 기능은 해제되어 있습니다(기본값임).

포인트

포인트의 이동은 데이터베이스 포인트를 단순히 평행 이동시키는 것입니다. 하나 이상의 포인트를 이동시키려면 먼저 해당 포인트를 선택한 다음, 마우스 포인터를 이 선택 포인트로 옮겨서 편집 핸들을 찾습니다. 포인터는 핸들에 위치하게 되면 [image] 로 바뀝니다. 원하는 위치로 옮기고 나서 마우스의 단추를 놓으면 [포인트 및 텍스트 이동] 대화 상자가 나옵니다. 이 대화 상자를 이용하여 해당 값을 수정하고 확인을 합니다.

포인트 끌기를 하면 선택한 모든 포인트와 텍스트가 이동되게 됩니다.


이름이 없는 포인트

프로젝트 내에서 개체는 각자의 고유한 핸들로써 기록됩니다. 이 핸들은 Trimble Geomatics Office가 해당 포인트의 식별에 쓰는 고유한 정수값입니다. 따라서 포인트에 어떤 이름을 부여하지 않는 경우에도 Trimble Geomatics Office는 그 내부 핸들을 이용하여 해당 포인트를 인식하게 됩니다.

이름이 없는 포인트가 이름을 필요로 하게 되는 경우(예: [포인트 삽입] 대화 상자에서 종점으로 선택된 경우), 그 포인트의 실제 데이터베이스 핸들이 나옵니다. 등호(=) 문자가 그 이름 앞에 붙는데, 이는 사용자가 어느 포인트를 선택하였는지 알아내는 소프트웨어 자체의 식별 방법입니다.


상태 표시줄

상태 표시줄은 그래픽 창의 하단에 있는데 소프트웨어의 현재 상태에 대한 정보(좌표 정보 등)가 표시되는 줄입니다.

마우스를 Timeline 보기 영역으로 가져가는 경우에는 시간 정보가 상태 표시줄에 나타납니다. 이것은 시간 옵션의 설정 여하에 따라 Windows 현지 시간이 될 수도 있고 GPS 주/초일 수도 있습니다.

Trimble Geomatics Office에서 기선 처리 등의 작업이 수행 중일 경우에는 상태 표시줄이 진행도 표시기(Progress Indicator)가 됩니다.

상태 표시줄의 표시기에 대한 자세한 내용은 Trimble Geomatics Office의 사용자 안내서(User Guide)를 참조하십시오.


상태 표시줄 - 창 코너
상태 표시줄 − 창 코너

창 코너를 이용하여 메인 그래픽 창의 크기를 재조정합니다.


진행도 표시기

Trimble Geomatics Office에서 특정 명령이 수행 중일 경우에는 상태 표시줄이 진행도 표시기(Progress Indicator)로 바뀝니다.

아래 그림에서 보는 바와 같이, 수행 명령에 대한 간단한 설명이 나오고, 그에 뒤이어 작업의 진척 정도를 나타내는 막대 그래프가 표시됩니다.

수행 중인 명령이 도중에 중단할 수 있는 성격일 경우, �취소하려면 ESC키를 누르십시오.�라는 메시지가 나옵니다. 이 때 ESC키를 누르면 명령 수행이 중단됩니다. 도중에 중단할 수 없는 성격의 명령이 수행 중일 경우에는 이 메시지가 나오지 않습니다.


[복원] 명령

활성 창을 원래의 크기와 위치로 복원합니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [복원]을 선택합니다.


[이동] 명령

이 명령을 실행하면 네방향 화살표가 나오는데, 이 때 키보드의 화살표 키로써 활성 창이나 대화 상자를 이동할 수 있습니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [이동]을 선택합니다 .

참조: 이 명령은 창이 최대화되어 있는 상태에서는 활성화되지 않습니다.


[크기] 명령

이 명령을 실행하면 네방향 화살표가 나오는데, 이 때 키보드의 화살표 키로써 활성 창의 크기를 바꿀 수 있습니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [크기]를 선택합니다.

포인터가 네방향 화살표로 바뀐 다음,

1.	움직이고자 하는 창 모서리로 포인터를 가져가기 위하여 방향키(좌우 상하 화살표 키) 중 하나를 누릅니다.

2.	방향키를 눌러 모서리를 이동시킵니다.

3.	원하는 크기가 되면 Enter키를 칩니다.

참조: 이 명령은 창이 최대화되어 있는 상태에서는 활성화되지 않습니다.


[최소화] 명령

Trimble Geomatics Office 프레임 창의 크기를 줄여 아이콘으로 표시합니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [최소화]를 선택합니다.


[최대화] 명령

활성 창의 크기를 확대하여 전체 화면으로 나타냅니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [최대화]를 선택합니다.


[닫기] 명령

활성 창이나 대화 상자를 닫습니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [닫기]를 선택합니다.


[다음] 명령

열려 있는 그래픽 창 중에서 불러온 순서에 의거, 그 다음 창으로 전환합니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [다음]을 선택합니다.


[이전] 명령

열려 있는 그래픽 창 중에서 불러온 순서에 의거, 직전 창으로 전환합니다.

실행 방법:

1.	다음 중 하나의 방법을 이용합니다.

  제목 표시줄에서 Trimble Geomatics Office 단추 [image] 를 누릅니다.

  제목 표시줄을 마우스의 오른쪽 단추로 누릅니다.

  메뉴 표시줄에서 시스템 단추 [image] 를 누릅니다.

시스템 메뉴가 나옵니다.

2.	시스템 메뉴에서 [이전]을 선택합니다.


[전환] 명령

열려 있는 모든 응용 프로그램의 목록을 표시합니다.

[태스크 목록] 옵션을 이용하여 목록상의 어떤 응용 프로그램으로 전환해 가거나 이를 닫습니다.

대화 상자 옵션

[전환] 명령을 실행하면 다음과 같은 옵션이 있는 대화 상자가 나옵니다.

옵션	설명
태스크 목록	전환하거나 닫고자 하는 응용 프로그램을 선택합니다.
전환	선택한 응용 프로그램을 활성화합니다.
태스크 종료	선택한 응용 프로그램을 닫습니다.
취소	[태스크 목록] 옵션을 닫습니다.
계단식 배열	열려 있는 응용 프로그램들을 계단식으로 배열함으로써 각 제목 표시줄이 보이게 합니다. 이 옵션은 아이콘화된 응용 프로그램에는 적용되지 않습니다.
바둑판식 배열	열려 있는 응용 프로그램들이 서로 겹치지 않도록 바둑판식으로 배열합니다. 이 옵션은 아이콘화된 응용 프로그램에는 적용되지 않습니다
아이콘 정렬	최소화된 응용 프로그램들의 아이콘을 모두 화면의 하단에 수평으로 정렬합니다.


Trimble Geomatics Office로 파일을 끌어다 놓기

개요 및 추가 정보	방법...

Windows 탐색기와 Microsoft Windows '끌어다 놓기' 기능을 써서 어떤 폴더로부터 데이터 파일을 Trimble Geomatics Office 프로젝트로 가져옵니다.

[가져오기] 대화 상자의 탭 하에 있는 파일 형식이면 어느 것이나 가져올 수 있습니다.

참조: PC 카드로부터 .job 파일이나 .raw 파일을 Trimble Geomatics Office 프로젝트로 끌어다 놓을 수 없습니다. 이 파일들을 Trimble Geomatics Office 프로젝트로 전송하려면 Trimble Geomatics Office를 이용하도록 합니다. 이 소프트웨어는 해당 파일들을 올바른 포맷으로 변환합니다.

단일 포맷

마우스의 오른쪽 단추나 왼쪽 단추를 이용하여 파일을 끌어다 놓을 수 있습니다.

하지만 오른쪽 단추를 이용하는 편이 더 좋는데, 그 이유는 다음과 같습니다.

  끌기를 한 후 오른쪽 단추를 놓을 때, 가져오기 포맷의 목록이 나옵니다. 그 중 올바른 포맷을 선택할 수 있습니다.

  끌기를 한 후 왼쪽 단추를 놓을 때, Trimble Geomatics Office가 파일 확장자를 이용하여 그 파일의 포맷을 결정합니다. 하지만 항상 올바른 파일 포맷이 선택되리라는 보장은 없습니다.

복수 포맷

마우스의 오른쪽 단추나 왼쪽 단추를 이용하여 여러 파일을 끌어다 놓을 수 있습니다.

  마우스의 오른쪽 단추를 써서 동일한 형식의 파일을 여러 개 끌어다 놓을 수 있습니다. 이 때, 포맷의 목록이 나오는데, 그 중 올바른 가져오기 포맷을 선택하면 됩니다. 서로 다른 형식의 파일들(예: .dc 파일과 .dat 파일)을 끌어다 놓는 경우에는 각각의 가져오기 옵션이 목록에 나오지 않습니다. 각 파일 형식에 대한 가져오기 옵션을 이용하려면 목록에서 '기본값'을 선택합니다. 이 때, Trimble Geomatics Office가 파일 확장자를 이용하여 그 파일의 포맷을 결정합니다. 하지만, 항상 올바른 파일 포맷이 선택되리라는 보장은 없습니다.

  마우스의 왼쪽 단추를 써서 서로 다른 형식의 파일을 여러 개 끌어다 놓을 수 있습니다. 이 때, Trimble Geomatics Office가 파일 확장자를 이용하여 그 파일의 포맷을 결정합니다. 하지만, 항상 올바른 파일 포맷이 선택되리라는 보장은 없습니다.

참조: 끌어다 놓기로써 가져오는 포맷을 Trimble Geomatics Office가 인식하지 못할 경우에는 바로 가기 메뉴가 나오는데, 이 때 그 파일을 제3자 데이터 레코더 파일로서 가져올지, 아니면 NMEA 파일로서 가져올지 선택할 수 있습니다. '기본값' 옵션을 선택하면 Trimble Geomatics Office는 해당 파일을 NMEA 파일로서 가져오려 할 것입니다.

사용자 정의 포맷

마우스의 오른쪽 단추로써 파일을 Trimble Geomatics Office 프로젝트에 끌어다 놓을 때, 사용자가 만든 가져오기 포맷이 바로 가기 메뉴에 모두 나옵니다.

팁: 열려 있는 프로젝트가 없을 경우, 어떤 프로젝트의 Options.ini 파일을 Trimble Geomatics Office로 끌어옴으로써 그 프로젝트를 열 수 있습니다.


바로가기 메뉴

바로 가기 메뉴의 명령 항목은 마우스 오른쪽 누르기를 했을 때의 포인터 위치 여하에 따라 그때 그때 달라지는 '문맥에 따른(context-sensitive)' 형식입니다.

다음과 같이 흔히 쓰는 태스크에 대하여 바로가기 메뉴를 이용할 수 있습니다.

 흔히 쓰는 메뉴 명령이나 대화 상자의 불러오기

 디스플레이 설정을 토글하기

 필드 코드 삽입

바로가기 메뉴를 불러오는 방법:

1.	적당한 위치에 포인터를 둡니다.

2.	마우스의 오른쪽 단추를 누릅니다.


핫 키

핫 키(Hot key)는 키보드를 이용하여 메뉴나 대화 상자의 옵션을 신속하게 선택하는 방법입니다.

선택하고자 하는 옵션의 밑줄 쳐진 글자를 키보드에서 치면 됩니다.


좌표계 - 개요
좌표계 − 개요

추가 정보

방법 ...	대화 상자	기타
개요

Trimble Geomatics Office는 좌표계를 이용하여 곡면(지구)상의 측정치를 평면(지도나 평면도)으로 변환합니다. 예를 들어, 좌표계는 GPS로 측정한 포인트(GPS 측정치는 WGS-84 타원체를 기준으로 함)에 대한 그리드 좌표를 계산함에 쓰입니다.

좌표계의 구성 요소는 다음과 같습니다.

  데이텀 변환 (WGS-84 타원체와 로컬 타원체간의)

  투영법

  지오이드 모델

  GPS 사이트 캘리브레이션 (수평 조정과 수직 조정)

각 프로젝트에 대하여는 좌표계를 선택하여야 합니다. 좌표계가 없거나, 어떤 좌표계를 선택해야 할지 모르는 경우에는 기본 투영법을 이용할 수도 있습니다.

참조: 프로젝트의 포인트들이 사용 투영법의 등록 정보에 의거, 투영 원점으로부터 너무 먼 거리에 있지 않도록 합니다.

좌표계 데이터베이스

좌표계 데이터베이스는 Current.csd라는 파일로 저장되는데, 여기에는 좌표계 정보가 모두 포함되어 있습니다. Trimble은 공표된 전세계의 주요 좌표계를 제공합니다. 좌표계나 존, 사이트, 데이텀 변환, 타원체, 지오이드 모델의 정의나 편집은 Coordinate System Manager 유틸리티를 이용합니다.

좌표계 선택하기

프로젝트에 대한 좌표계의 선택은 다음 중 하나를 이용합니다.

  좌표계 데이터베이스로부터의 좌표계와 존

  좌표계 데이터베이스로부터의 사이트

  정의되지 않은 기본 투영법

  정의된 기본 투영법

  가져오기 도중 Survey Controller (*.dc) 파일에 명시된 좌표계

Trimble Geomatics Office 소프트웨어에서 좌표계를 선택할 때, 매개 변수는 좌표계 데이터베이스로부터 가져옵니다.

프로젝트의 좌표계 변경

프로젝트의 좌표계를 변경하는 방법은 다음 2가지입니다.

  [프로젝트 등록 정보] 대화 상자를 이용하여 새 좌표계를 명시합니다.

  다른 좌표계가 있는 Survey Controller (*.dc) 파일을 Trimble Geomatics Office 프로젝트에 가져옵니다. 프로젝트에 어떤 좌표계가 있고, Survey Controller 파일에 또 다른 좌표계가 있을 경우에는 가져오기 과정에서 소프트웨어가 그 차이를 탐지하여 어느 것을 이용할지 택일하게 합니다. 이 때 Survey Controller 파일의 좌표계를 선택하면 프로젝트의 좌표계가 바뀌게 됩니다.

프로젝트의 좌표계를 변경하는 경우, Trimble Geomatics Office는 모든 포인트의 좌표를 재계산합니다. 즉, 구 좌표계에서 새 좌표계로 좌표가 변환됩니다. 이 변환 과정은 일반적으로 다음과 같습니다.

1.	모든 좌표는 해당 타원체(일반적으로 WGS-84 타원체이지만, 투영법만 변경된 경우에는 로컬 타원체)로 축소 변환됩니다.

2.	새 매개 변수를 토대로 좌표가 다시 계산됩니다.

다음은 이 단계를 예시하는 그림입니다.

지오이드 모델이나 수직 조정이 구 좌표계의 일부분이라면 이것은 현장 관측치로부터 도출되지 않은 모든 포인트에 대한 WGS-84고의 계산에 이용됩니다. 마찬가지로, 지오이드 모델이나 수직 조정이 새 좌표계에서 적용되는 경우, 이것은 WGS-84고로부터 그리드 좌표의 새 표고를 계산함에 이용됩니다.

좌표계 변경이 RoadLink 및 DTMLink 소프트웨어에 미치는 영향

프로젝트로부터 Trimble의 RoadLink나 DTMLink 유틸리티로 포인트를 내보낼 때, 뒤이어 Trimble Geomatics Office 프로젝트가 변경되더라도 이 포인트는 업데이트되지 않습니다.

따라서 Trimble Geomatics Office 프로젝트에 대한 변경 작업이 완전히 끝나기 전에는 포인트의 내보내기를 하지 않는 것이 좋습니다.

Trimble Geomatics Office 프로젝트로부터 RoadLink나 DTMLink로 포인트를 내보낸 이후 단계에서 프로젝트의 좌표계를 변경하거나 데이터의 캘리브레이션을 하게 되면 다음의 경고 메시지가 나옵니다.

�DTMLink와 RoadLink의 포인트 좌표는 사용자가 그 좌표계를 변경할 때 업데이트가 되지 않을 것입니다.�

처리 옵션:

  포인트의 좌표가 RoadLink나 DTMLink에서 바뀌지 않게 된다는 사실을 받아 들이면 [확인] 단추를 누릅니다.

  변경을 취소하려면 [취소] 단추를 누릅니다.

가장 최근에 업데이트된 좌표를 RoadLink와 DTMLink 유틸리티에서 이용하기 위해서는,

1.	RoadLink와 DTMLink에서 불필요한 포인트를 삭제합니다.

2.	Trimble Geomatics Office 프로젝트로부터 포인트를 다시 내보냅니다.


지상 좌표계

투영 좌표 대신 지상 좌표를 쓰고자 하면 지상 좌표계를 이용합니다. 지상 좌표계의 이용시 그리드 거리는 지상 거리와 같습니다.

Trimble Geomatics Office 소프트웨어에서 지상 좌표를 이용하고자 하면 다음의 작업을 하여야 합니다.

1.	프로젝트에 대한 좌표계 정의

2.	프로젝트 위치에 대한 좌표 입력. 프로젝트 위치는 로컬 위도와 로컬 경도로서 저장됩니다.

3.	지상 축척 계수를 바로 입력하거나, 프로젝트 위치에 대한 좌표를 이용하여 지상 축척 계수를 계산

프로젝트에 대한 좌표계 정의

Trimble Geomatics Office 프로젝트에서 좌표계를 선택하고 변경하는 방법은 좌표계 � 개요 항목을 참조합니다.

프로젝트 위치에 대한 좌표 입력

입력 방법:

1.	[파일 / 프로젝트 등록 정보] 명령을 실행합니다. [프로젝트 등록 정보] 대화 상자가 나옵니다.

2.	[좌표계] 탭을 선택합니다.

3.	[로컬 사이트 설정] 상자에서 [변경] 단추를 누르면 [로컬 사이트 설정] 대화 상자 가 나옵니다.

4.	[프로젝트 위치] 상자에서 해당 좌표를 입력합니다. 그 좌표계가 정의되지 않은 것이라면 이것을 업데이트하도록 하는 메시지가 나옵니다.

위도와 경도는 거의 정확한 값이어야 합니다. 표고도 실제 표고와 너무 차이가 나지 않는 추정치여야 하므로 평균 표고를 프로젝트에 입력하도록 합니다.

지상 축척 계수

방법:

1.	[로컬 사이트 설정] 대화 상자에서 [지상 좌표 이용] 확인란을 선택하고 다음 중 하나를 실행합니다.

  지상 축척 계수 입력

  [프로젝트 위치로부터 축척 계수 계산] 확인란을 선택. [프로젝트 위치] 상자의 값으로부터 지상 축척 계수가 계산됩니다.

  지상 좌표의 표시 방식을 결정. X 좌표/Y 좌표 옵셋이나 4~5 자리수의 좌표를 명시할 수 있습니다. 좌표간의 구별을 용이하게 하고자 하면 이 옵션을 선택합니다.

참조: 지상 좌표계는 사용자가 프로젝트 위치 가까이에서 작업 중이며, 프로젝트고에 큰 변이가 없다고 간주합니다.

지상 축척 계수 계산:

1.	기준 표고(h)의 결정

2.	표고 계수의 계산

여기서,

R : 타원체 반경

h : 기준 표고

a : 장반경

e2 : 이심률 제곱

φ : 투영 원점 위도

3.	프로젝트 위치 중심점에서의 지상 축척 계수 계산

여기서,

s : 프로젝트 위치에서의 그리드 축척 계수

Trimble Survey Controller 버전 10에서는 지상 좌표계가 완전히 지원됩니다. 다음은 Trimble Survey Controller 버전 7.7 이하에서의 지상 좌표계에 대한 설명입니다.

참조:

지상 좌표가 있는 프로젝트를 Trimble Survey Controller 버전 7.5 � 7.7로부터 가져오기

Transverse Mercator 투영법(지상 축척 계수가 정의되어 있음. 예: 캘리브레이션이 있는 비투영/무데이텀 작업)이 있는 Trimble Survey Controller(버전 7.5나 7.7) 작업을 가져오는 경우, [로컬 사이트 설정] 대화 상자의 [지상 좌표 이용] 확인란을 선택하지 않도록 합니다. 그렇지 않으면 지상 축척 계수가 두번 적용되게 됩니다.

지상 축척 계수가 정의되어 있는 Trimble Survey Controller 작업을 정의된 지상 좌표계가 없는 Trimble Geomatics Office 프로젝트로 가져오는 경우, 그 작업의 좌표계와 프로젝트의 좌표계가 서로 다르다는 경고 메시지가 나옵니다. Trimble Geomatics Office 프로젝트의 좌표계를 이용하고, [로컬 사이트 설정] 대화 상자의 [지상 좌표 이용] 확인란을 선택하도록 합니다.

지상 좌표가 있는 프로젝트를 Trimble Survey Controller 버전 7.5 � 7.7로 내보내기

정의된 지상 좌표계가 있는 Trimble Geomatics Office 프로젝트를 Trimble Survey Controller(버전 7.70 이하)로 내보내었다가 나중에 다시 Trimble Geomatics Office 소프트웨어로 가져오는 경우에는 그 좌표계가 달라지게 됩니다. 반드시 Trimble Geomatics Office 좌표계를 선택하도록 합니다.

Trimble Survey Controller(버전 7.7이하)는 Lambert Conformal Conic 2 Parallel 투영법이 있는 지상 좌표를 지원하지 않습니다. 그 좌표계는 Lambert Conformal Conic 1 Parallel 투영법과 함께 Trimble Geomatics Office로부터 Trimble Survey Controller로 송출됩니다.

Trimble Survey Controller(버전 7.7 이하)는 Albers Equal Area Conic 투영법이 있는 지상 좌표를 지원하지 않습니다. Albers Equal Area Conic 투영법이 정의되어 있는 프로젝트를 Trimble Survey Controller 소프트웨어로 내보내고자 하면, 그 지상 좌표를 제거하거나 투영법을 변경합니다.


데이텀 변환 - 개요
데이텀 변환 − 개요

추가 정보

 기타

개요

데이텀 변환이란 어떤 타원체(예: WGS-84 타원체)상의 좌표를 로컬 타원체(투영법에서 쓰는 타원체) 좌표로의 변환에 이용하는 매개 변수의 집합입니다. 데이텀 변환은 좌표계 정의의 한 구성 요소입니다.

이용할 수 있는 데이텀 변환법:

  Molodensky 법(3 매개 변수법)

  7 매개 변수법

  데이텀 그리드법

  다중 회귀법

모든 변환법은 좌표계 데이터베이스에 저장됩니다.

새 데이텀 변환법을 정의하려면 Coordinate System Manager 유틸리티를 이용하여 좌표계 데이터베이스를 편집하면 됩니다.


데이텀 변환 - Molodensky 법(3 매개 변수법)
데이텀 변환 − Molodensky 법(3 매개 변수법)

 개요 및 추가 정보

Molodensky 데이텀 변환법은 WGS-84 타원체의 원점으로부터 로컬 타원체의 원점으로(또는 그 반대로) X, Y, Z축 방향의 평행 이동을 하는 방법입니다.

Molodensky 데이텀 변환법은 3 매개 변수 데이텀 변환법이라고도 합니다.

내역 보기

Molodensky 데이텀 변환법이 프로젝트 좌표계의 한 부분으로서 정의되어 있다면, 그 데이텀 변환 값을 볼 수 있습니다.

이 값은 [좌표계 내역] 대화 상자에서 봅니다.

이 필드들은 WGS-84 타원체 원점으로부터 로컬 타원체 원점으로의 3차원 Cartesian(X, Y, Z) 변환에 대한 정의입니다.

데이텀 변환법은 좌표계 데이터베이스(Current.csd)에 저장됩니다. 변환법의 편집은 Coordinate System Manager 유틸리티를 이용합니다.


데이텀 변환 - 7 매개 변수법
데이텀 변환 − 7 매개 변수법

 개요 및 추가 정보

7 매개 변수 데이텀 변환법은 WGS-84 타원체에서 로컬 타원체로나, 로컬 타원체에서WGS-84 타원체로의 변환을 하는 방법입니다.

평행 이동

이것은 WGS-84 타원체의 원점으로부터 로컬 타원체의 원점으로 3 차원 Cartesian(X, Y, Z) 변환 방법을 정합니다.

회전

X, Y, Z 값은 X, Y, Z 축의 회전 각도입니다. 이것은 WGS-84 타원체의 Cartesian 축을 로컬 타원체 축과 정렬시키기 위하여 회전하여야 하는 각도를 말합니다.

회전 방향은 각 축의 양(+) 방향 끝 부분에서 보았을 때의 시계 반대 쪽입니다.

축척 계수

모든 좌표는 이 값으로 곱하게 됩니다. 축척 계수는 백만분율 단위로 표시하는데, 만일 이 값이 6.02이라면 모든 좌표는 1.00000602로 곱해집니다.

내역 보기

7 매개 변수 데이텀 변환법이 프로젝트 좌표계의 한 부분으로서 정의되어 있다면, 그 데이텀 변환 값을 볼 수 있습니다.

이 값은 [좌표계 내역] 대화 상자 � [데이텀 변환] 탭에서 봅니다.

데이텀 변환법은 좌표계 데이터베이스(Current.csd)에 저장됩니다. 변환법의 편집은 Coordinate System Manager 유틸리티를 이용합니다.


데이텀 변환 - 데이텀 그리드법
데이텀 변환 − 데이텀 그리드법

 개요 및 추가 정보

데이텀 그리드 변환법은 해당 지역의 데이텀 변환 매개 변수 값이 들어 있는 파일을 이용하는 방법입니다. 이 파일은 특정 지역에서의 데이텀 변환 값을 보간하는 기능을 수행합니다.

어떤 데이텀 그리드를 프로젝트 좌표계 정의의 한 부분으로 이용하려면, 위도 및 경도 데이텀 그리드 (*.dgf) 파일로써 정의되는 데이텀 변환법을 선택하여야 합니다.

데이텀 그리드 파일로써 데이텀 변환법을 새로 만들거나 보려면 Coordinate System Manager 유틸리티를 이용합니다.

현장에서 데이텀 그리드 파일을 이용하기 위해서는 이 파일을 Trimble Survey Controller(버전 7.00 이상)에 결합 데이텀 그리드 파일로 전송하여야 합니다.


데이텀 변환 - 다중 회귀법
데이텀 변환 − 다중 회귀법

 개요 및 추가 정보

다중 회귀 데이텀 변환법은 WGS-84 타원체와 로컬 타원체 상호간의 변환에 있어 다항식을 넣어 처리하는 방법입니다. 다중 회귀법을 추가하려면 Coordinate System Manager 유틸리티를 이용합니다.

내역 보기

다중 회귀 데이텀 변환법이 프로젝트 좌표계의 한 부분으로서 정의되어 있다면, 그 데이텀 변환 값을 볼 수 있습니다.

이 값은 [좌표계 내역] 대화 상자 � [데이텀 변환] 탭에서 봅니다.

데이텀 변환법은 좌표계 데이터베이스(Current.csd)에 저장됩니다. 변환법의 편집은 Coordinate System Manager 유틸리티를 이용합니다.


투영법 - 개요
투영법 − 개요

추가 정보

 기타

개요

투영법은 타원체 곡면을 사각형 좌표 그리드상에서 나타내는 수식입니다.

투영법을 이용함으로써 로컬 측지 좌표를 로컬 그리드 좌표로 변환합니다.

그리드 좌표를 플로팅하면 지구 표면의 전부 또는 일부를 표현하는 지도가 만들어집니다.

그리드 좌표를 유도할 때 발생하는 왜곡 현상을 최소화함으로써 최적의 결과를 얻기 위하여 각 나라나 지역에 따라 서로 다른 투영법을 이용합니다. Coordinate System Manager 유틸리티에는 아주 다양한 투영법(예: Transverse Mercator나 Lambert One Parallel 등)이 들어 있습니다. 투영법에 대한 자세한 사항은 Coordinate System Manager 유틸리티의 도움말을 참조하십시오.

참조: 프로젝트의 포인트들이 사용 투영법의 등록 정보에 의거, 투영 원점으로부터 너무 먼 거리에 있지 않도록 합니다.

투영 매개 변수를 좌표계 정의의 한 구성 요소로서 정의하려면, Coordinate System Manager 유틸리티를 이용합니다.


지오이드 모델 - 개요
지오이드 모델 − 개요

추가 정보

 기타

개요

지오이드는 해수면과 거의 일치하는 중력 등포텐셜 표면입니다.

GPS로 관측한 포인트의 높이는 WGS-84 타원체를 기준으로 한 것인데 타원체고라 부릅니다.

지오이드 모델을 이용하면 타원체고를 토대로 하는 표고를 추정할 수 있습니다.

지오이드 모델은 지오이드 그리드 (*.ggf) 파일로서 저장됩니다. ggf 파일에는 그리드 상의 수많은 위치에 대한 지오이드 분리 간격 값이 들어 있습니다. 이 그리드 사이에 있는 지점에서의 지오이드 분리 간격은 보간법을 적용하면 계산해 낼 수 있습니다.

GPS로 관측한 각 포인트에 대하여 어떤 지오이드 모델을 선택하면, Trimble Geomatics Office는 이 ggf 파일을 이용하여 해당 지점의 지오이드 분리 간격(N)을 보간 계산합니다. 그 다음, 관측된 타원체고(h)에 이 값을 합산하거나 차감함으로써 해당 GPS 점의 해수면 표고 근사값(e)을 유도해 냅니다. 다음은 지오이드와 로컬 타원체간의 관계를 나타내는 그림입니다.

기존의 지오이드 그리드 파일로써 새 지오이드 모델을 정의하고자 하면 Coordinate System Manager 유틸리티를 이용합니다. 프로젝트에 대하여 어떤 좌표계를 선택하면 그 좌표계 데이터베이스의 지오이드 모델을 모두 이용할 수 있게 됩니다.

Trimble Geomatics Office로써 지오이드 그리드 파일을 Trimble Survey Controller나 TDS Survey Pro CE 소프트웨어(버전 3.5 이상)로 내보내고 기존 지오이드 그리드 파일의 서브 그리드 만들기 를 할 수 있습니다.

참조: 지오이드 모델을 이용하지 않거나 GPS 사이트 캘리브레이션을 수행하지 않을 경우, 어떤 포인트의 표고는 실제 표고가 아니라 타원체고와 같아지게 됩니다. 지오이드 모델을 프로젝트 좌표계에 이용하는 경우, 이 지오이드 모델은 GPS 점 뿐만 아니라 다른 모든 유형의 포인트에 대한 로컬 타원체고와 표고를 상호 변환하는 일에 쓰입니다.


좌표계 변경 - [좌표계 선택] 대화 상자
좌표계 변경 − [좌표계 선택] 대화 상자

이 대화 상자를 이용하여 기존 좌표계나 사이트를 선택하거나 프로젝트의 기본 투영법을 정의합니다.

이 대화 상자는 좌표계 선택 설정 마법사의 첫째 단계입니다.

[다음] 단추를 눌러 앞으로 진행하고, [뒤로] 단추를 눌러 이전의 선택 대화 상자로 돌아갑니다.

Trimble Geomatics Office는 좌표계 데이터베이스 파일(Current.csd)의 좌표계를 이용합니다. Coordinate System Manager 유틸리티를 이용하면 좌표계의 매개 변수를 편집할 수 있습니다.

새 좌표계

새 좌표계와 존, 좌표계 데이터베이스에 저장된 로컬 캘리브레이션 사이트, 기본 투영법을 선택하려면

1.	[새 좌표계]를 선택합니다.

2.	[다음] 단추를 눌러 [좌표계 종류 선택] 대화 상자로 이동합니다.

3.	이 마법사를 이용하여 해당 프로젝트의 좌표계를 선택합니다.

최근 이용 좌표계

최근 이용한 10개의 좌표계 중에서 하나를 선택하려면

1.	[최근 이용 좌표계]를 누릅니다.

2.	화살표 단추로써 좌표계 요약 목록을 스크롤합니다.

3.	프로젝트에 이용하고자 하는 좌표계를 선택합니다.

4.	[종료] 단추를 누릅니다.

참조: 좌표계 데이터베이스를 처음으로 이용하는 경우에는 [좌표계 선택] 대화 상자 대신, [좌표계 종류 선택] 대화 상자가 나옵니다. 이것은 최근에 이용한 좌표계가 전혀 없기 때문입니다.

참조: Trimble Geomatics Office는 Coordinate System Manager 유틸리티상의 좌표계를 모두 지원하지는 않습니다. 지원되지 않는 좌표계를 선택하게 되면 다음의 메시지가 나옵니다.

�알 수 없는 좌표계 종류�


[좌표계 종류 선택] 대화 상자

이용하고자 하는 좌표계의 종류를 선택합니다.

좌표계와 존

좌표계 데이터베이스로부터 좌표계를 선택하려면 이 옵션을 이용합니다.

캘리브레이션 사이트

좌표계 데이터베이스에 저장해 둔 캘리브레이션 사이트를 선택하려면 이 옵션을 이용합니다. 사이트는 저장된 좌표계 내역으로서, GPS 캘리브레이션 매개 변수가 들어 있습니다.

기본 투영법 (Transverse Mercator)

기본 투영법을 정의하기 위한 옵션입니다.

뒤로

이 단추를 누르면 [좌표계 선택] 대화 상자로 되돌아 갑니다.

참조: 좌표계 데이터베이스를 처음으로 이용하는 경우에는 최근에 이용한 좌표계가 전혀 없기 때문에 [뒤로] 단추가 활성화되지 않습니다.

다음

이 단추를 누를 경우, 선택한 옵션 여하에 따라 다음 대화 상자 중 하나가 나옵니다.

  [좌표계 존 선택] 대화 상자

  [캘리브레이션 사이트 선택] 대화 상자

  [기본 투영법 (Transverse Mercator)] 대화 상자


[좌표계 존 선택] 대화 상자

좌표계 데이터베이스에 있는 좌표계의 목록에서 프로젝트에 대한 좌표계를 선택합니다.

좌표계 그룹이나 존의 등록 정보를 보려면

1.	좌표계 그룹이나 존을 선택합니다.

2.	마우스의 오른쪽 누르기로써 바로 가기 메뉴를 불러온 다음, [등록 정보]를 선택합니다.

좌표계 그룹

이 목록에는 좌표계 데이터베이스에 있는 좌표계들이 나옵니다. 각 좌표계에는 서로 다른 지역을 정의한 존이 하나 이상 있습니다.

존

이 목록에는 선택된 좌표계에 대한 존(Zone)들이 나옵니다. 존은 데이텀 변환(데이터를 WGS-84 타원체로부터 로컬 타원체로 변환하는 매개 변수의 집합을 포함), 지오이드 모델, 투영 매개 변수를 포함합니다.

뒤로

이 단추를 누르면 [좌표계 종류 선택] 대화 상자로 되돌아 갑니다.

다음

이 단추를 누르면 [지오이드 모델 선택] 대화 상자가 나옵니다.


[캘리브레이션 사이트 선택] 대화 상자

좌표계 데이터베이스에 있는 캘리브레이션 사이트의 목록에서 캘리브레이션 사이트를 선택합니다. 사이트는 Coordinate System Manager 유틸리티나 Trimble Geomatics Office([파일 / 프로젝트 등록 정보] - [좌표계] 탭이나 [측량 / GPS 사이트 캘리브레이션]으로)에서 만드는데 좌표계 데이터베이스에 저장됩니다

사이트의 등록 정보를 보려면

1.	사이트 이름을 선택합니다.

2.	마우스의 오른쪽 누르기로써 바로 가기 메뉴를 불러온 다음, [등록 정보]를 선택합니다.

사이트 내역

이 상자에는 선택된 사이트에 대한 데이텀 변환과 지오이드 모델이 나옵니다.

뒤로

이 단추를 누르면 [좌표계 종류 선택] 대화 상자로 되돌아 갑니다.

종료

좌표계 정의를 마무리하고 [프로젝트 등록 정보] 대화 상자로 되돌아 가려면 이 단추를 누릅니다. 이제 이 사이트의 정의가 프로젝트 좌표계가 됩니다.

참조: Trimble Geomatics Office 소프트웨어에서는 사이트의 지오이드 모델을 변경할 수 없습니다. 그 사이트에 지정된 지오이드 모델이 그냥 적용되는데, 만약 사이트의 지오이드 모델을 변경하려면 Coordinate System Manager 유틸리티에서 그 사이트를 편집하도록 합니다.


[기본 투영법 (Transverse Mercator)] 대화 상자

이 대화 상자를 이용하여 기본 투영법의 매개 변수를 명시합니다. 이 값은 Trimble Geomatics Office 상에서 자동 계산해 내거나, 아니면 사용자가 직접 입력해 넣을 수 있습니다.

투영 매개 변수 자동 계산

이 확인란을 선택하면 프로젝트에서 첫번째 입력된 WGS-84 위치가 원점으로 자동 이용되고, 첫번째 그리드 좌표(X 좌표, Y 좌표)가 X 좌표 상수와 Y 좌표 상수의 계산에 자동 이용되게 됩니다.

참조: 남 방위각 체계(필요한 경우)와 좌표의 정방향도 반드시 명시하여야 합니다. Trimble Geomatics Office는 이 필드들을 자동 업데이트하지 않습니다.

투영 매개 변수를 직접 입력하고자 하면 이 확인란을 선택 해제합니다. 다음의 필드들이 활성화되게 되므로 해당하는 값을 입력할 수 있습니다.

중심 위도

투영 원점의 위도를 입력합니다.

중심 경도

투영 원점의 경도를 입력합니다.

X 좌표 상수, Y 좌표 상수

기본 투영법에 대한 X 좌표 상수와 Y 좌표 상수를 입력합니다. 이들은 기본 투영법 원점의 그리드 좌표입니다.

축척 계수

원점에 대한 축척 계수인데 그 투영법의 알려진 축척 계수를 바탕으로 합니다. 그리드 거리 대 지상 거리의 비율로서, 모든 지상 좌표는 이 값에 의해 축소되어 그리드 거리로 나타납니다.

남 방위각 체계

남 방위각 체계를 지정하려면 이 필드를 선택합니다. 이 체계는 하와이나 남아프리카 같은 나라에서 이용하는데, 남쪽을 0도 방위각(다른 체계에서는 북쪽을 0도 방위각)으로 설정합니다.

좌표의 정방향

좌표 값의 증가 방향을 지정하는 옵션입니다.

뒤로

이 단추를 누르면 [좌표계 종류 선택] 대화 상자로 되돌아 갑니다.

다음

이 단추를 누르면 [지오이드 모델 선택] 대화 상자가 나옵니다.


[지오이드 모델 선택] 대화 상자

프로젝트에 대한 지오이드 모델을 선택하는 대화 상자입니다. 지오이드 모델이 좌표계 데이터베이스의 좌표계에 정의되어 있는 경우에는 이것이 자동 선택됩니다.

지오이드 모델은 지오이드−타원체의 분리 간격으로 구성되는 수학적 표면입니다. 이것은 WGS-84 타원체와 평균 해수면 사이의 추정 간격으로서, GPS 점의 정표고 근사치 유도에 이용됩니다.

지오이드 모델 불이용

좌표계에 지오이드 모델을 지정하지 않는 옵션입니다. 이 경우, 포인트의 표고는 로컬 타원체고입니다.

이 옵션의 선택시, GPS 사이트 캘리브레이션을 수행함으로써 GPS 관측치의 표고를 보다 정확하게 산출하는 것이 좋습니다(Trimble권장 사항).

사전 정의된 지오이드 모델

프로젝트에 지정할 지오이드 모델을 목록에서 선택합니다. 이 목록의 출처는 좌표계 데이터베이스(Current.csd)입니다.

WGS-84고와 지오이드 분리 간격으로써 도출된 표고는 이 지오이드 모델의 정확도 정도에 따라 등급이 부여됩니다. 지오이드 모델의 등급을 지정하려면 [프로젝트 등록 정보] 대화 상자 / [재계산] 탭 하의 [지오이드 모델의 질] 필드를 이용합니다. 지오이드 모델 등급은 포인트에 대한 표고 질의 결정에 이용됩니다.

뒤로

이 단추를 누르면 [좌표계 존 선택] 대화 상자나 [기본 투영법 (Transverse Mercator)] 대화 상자로 되돌아 갑니다.

종료

좌표계 정의를 마무리하고 [프로젝트 등록 정보] 대화 상자로 되돌아 가려면 이 단추를 누릅니다.


사이트 - 개요
사이트 − 개요

사이트는 기존 좌표계와 존을 바탕으로 한 로컬 GPS 사이트 캘리브레이션의 내역을 저장하는 역할을 합니다.

수행한 GPS 사이트 캘리브레이션과 좌표계는 좌표계 데이터베이스에 사이트로 저장하였다가 다음에 다시 이용할 수 있습니다.

사이트 저장 방법 2가지:

  [측량 / GPS 사이트 캘리브레이션] 명령을 실행합니다.

  [파일 / 프로젝트 등록 정보] 명령의 [좌표계] 탭을 선택합니다.

Coordinate System Manager 유틸리티를 이용하여 새 사이트를 만들 수도 있습니다. 이 유틸리티의 이용시, [사이트] 탭 하에는 저장된 사이트가 나옵니다.

보다 자세한 사항은 Coordinate System Manager의 도움말을 참조하십시오.

참조: 조정 변환 매개 변수는 사이트로 저장할 수 없습니다.


정의되지 않은 기본 투영법 이용하기 - 개요 / [기본 투영법 정의] 대화 상자
정의되지 않은 기본 투영법 이용하기 − 개요 / [기본 투영법 정의] 대화 상자

개요

정의되지 않은 기본 투영법은 원점의 위도/경도 값이 없는 기본 투영법입니다. 정의되지 않은 기본 투영법으로써 측량 데이터를 프로젝트에 처음 입력할 때, [기본 투영법 정의] 대화 상자가 나옵니다. 이 대화 상자는 입력 중인 데이터에 적합한 투영 매개 변수를 이용하도록 합니다. 이 대화 상자에서 이용할 수 있는 필드는 프로젝트에 추가 중인 그 데이터의 유형에 따라 달라집니다. 다음은 발생 가능한 시나리오입니다.

  GPS 점을 그리드 점이 들어 있는 프로젝트(정의되지 않은 기본 투영법)에 추가하기

  정의된 투영법이 있는 파일을 정의되지 않은 기본 투영법이 있는 프로젝트에 가져오기

  WGS-84 점을 프로젝트(정의되지 않은 기본 투영법)에 추가하기

  축척 계수만의 파일(정의되지 않은 기본 투영법)을 이용하기

  그리드 점을 공백 프로젝트에 추가하기

정의되지 않은 기본 투영법을 이용하려면 좌표계가 정의되어 있지 않은 프로젝트 템플리트(예: Trimble Metric과 US Feet 템플리트)를 이용하도록 합니다.


그리드 점 추가하기 (정의되지 않은 기본 투영법)

 개요 및 추가 정보

정의되지 않은 기본 투영법(무 좌표계)이 있는 Trimble Geomatics Office 프로젝트에 추가하는 첫번째 위치가 그리드 위치일 경우, [기본 투영법 정의] 대화 상자가 나옵니다.

이 대화 상자에는 다음과 같은 필드가 나옵니다.

X 좌표 상수

투영 원점의 X 좌표. 이 X 좌표 값은 파일에 있는 첫번째 포인트로부터 도출되는데, 변경을 할 수도 있습니다.

Y 좌표 상수

투영 원점의 Y 좌표. 이 Y 좌표 값은 파일에 있는 첫번째 포인트로부터 도출되는데, 변경을 할 수도 있습니다.

확인

[확인] 단추를 눌러 기본 투영 매개 변수를 적용합니다. 이 매개 변수들의 값은 프로젝트의 좌표계 정의에 쓰입니다. 매개 변수를 보려면 [파일 / 프로젝트 등록 정보] 명령을 실행한 다음, [좌표계] 탭 하의 [자세히] 단추를 누릅니다.

참조: 기본 투영법이 아직 완전히 정의되지 않았기 때문에(원점 위도/경도가 정의되지 않았음), GPS 점이 하나 이상 들어 있는 파일을 가져옴으로써 이 기본 투영법을 업데이트할 수 있습니다.


그리드 점이 들어 있는 프로젝트(정의되지 않은 기본 투영법)에 GPS 점 추가하기

 개요 및 추가 정보

Trimble Geomatics Office 프로젝트에 그리드 위치가 하나 이상 들어 있고, 정의되지 않은 기본 투영법(원점 위도/경도가 없음)이 있으며

  GPS 점이 최소한 하나 이상 들어 있는 파일을 가져오거나

  WGS-84 점을 키입력하는 경우,

[기본 투영법 정의] 대화 상자가 나옵니다. 이 대화 상자에는 다음과 같은 필드가 나옵니다.

X 좌표

이 필드는 공백값입니다. 기본 투영법 정의에 이용 중인 GPS 점에 대하여, 알려진 최적 X 좌표를 입력합니다.

Y 좌표

이 필드는 공백값입니다. 기본 투영법 정의에 이용 중인 GPS 점에 대하여, 알려진 최적 Y 좌표를 입력합니다.

위도

파일에 있는 첫번째 GPS 점의 WGS-84 위도가 여기에 나옵니다. 이 필드는 이용할 수 없습니다.

경도

파일에 있는 첫번째 GPS 점의 WGS-84 경도가 여기에 나옵니다. 이 필드는 이용할 수 없습니다.

확인

이 단추를 눌러 해당 GPS 점의 그리드 좌표를 적용합니다. 원점의 WGS-84 위도 값과 WGS-84 경도 값은 XY 방향 상수(이미 정의된)와, 이 대화 상자에 명시된 GPS 점 값을 기초로 하여 결정됩니다. 매개 변수를 모두 보려면 [파일 / 프로젝트 등록 정보] 명령을 실행한 다음, [좌표계] 탭 하의 [자세히] 단추를 누릅니다.

참조: 일단 데이터베이스에 GPS 점을 추가하고 기본 투영법을 완전히 정의하고 나면, 파일의 가져오기를 하거나 Trimble Geomatics Office 프로젝트에 포인트를 추가할 때, 기본 투영 매개 변수가 업데이트되지 않게 됩니다. 하지만 GPS 캘리브레이션을 수행([측량 / GPS 사이트 캘리브레이션] 명령 선택)함으로써 투영 원점을 업데이트할 수 있습니다.


프로젝트(정의되지 않은 기본 투영법)에 WGS-84 점 추가하기

정의되지 않은 기본 투영법(원점 위도/경도가 없음)이 Trimble Geomatics Office 프로젝트에 있고,

  WGS-84 점을 입력해 넣는 경우

  WGS-84 점의 가져오기를 하는 경우

[기본 투영법 정의] 대화 상자가 나옵니다. 이 대화 상자에는 다음과 같은 필드가 나옵니다.

X 좌표

이 필드의 기본값은 0입니다. 기본 투영법 정의에 이용 중인 포인트에 대하여, 알려진 최적 X 좌표를 입력합니다. 이 값은 해당 투영법에 대한 X 좌표 상수로 이용됩니다.

Y 좌표

이 필드의 기본값은 0입니다. 기본 투영법 정의에 이용 중인 포인트에 대하여, 알려진 최적 Y 좌표를 입력합니다. 이 값은 해당 투영법에 대한 Y 좌표 상수로 이용됩니다.

원점 위도

해당 포인트의 WGS-84 위도가 여기에 나옵니다. 이 필드는 투영 원점 위도인데 활성화되지 않으므로 이용할 수 없습니다.

원점 경도

해당 포인트의 WGS-84 경도가 여기에 나옵니다. 이 필드는 투영 원점 경도인데 활성화되지 않으므로 이용할 수 없습니다.

확인

[확인] 단추를 눌러 기본 투영 매개 변수를 적용합니다. 이 매개 변수들의 값은 프로젝트의 좌표계 정의에 쓰입니다. 매개 변수를 보려면 [파일 / 프로젝트 등록 정보] 명령을 실행한 다음, [좌표계] 탭 하의 [자세히] 단추를 누릅니다.

참조: 일단 기본 투영법을 완전히 정의하고 나면, Survey Controller 파일의 가져오기를 하거나 Trimble Geomatics Office 프로젝트에 포인트를 추가할 때, 기본 투영 매개 변수가 업데이트되지 않게 됩니다. 하지만 GPS 캘리브레이션을 수행([측량 / GPS 사이트 캘리브레이션] 명령 선택)함으로써 투영 원점을 업데이트할 수 있습니다.


정의되지 않은 기본 투영법이 있는 프로젝트에 Survey Controller 파일(정의된 투영법이 있음) 가져오기
정의되지 않은 기본 투영법이 있는 프로젝트에 파일(정의된 투영법이 있음) 가져오기

 개요 및 추가 정보

프로젝트의 좌표계가 파일의 좌표계로 자동 변경됩니다.

다음과 같은 메시지가 가져오기 보고서에 기록됩니다.

�도입 좌표계와 프로젝트의 기존 좌표계가 서로 달랐습니다. 전자의 정의가 정의되지 않은 기본(Transverse Mercator)투영법에 우선하여 쓰였습니다.�


Survey Controller (*.dc) 파일의 좌표계 이용하기
파일의 좌표계 이용하기

 개요 및 추가 정보

정의된 좌표계와 함께 파일을 가져오는 경우, 이 파일에 기록된 좌표계 정의와 프로젝트의 좌표계 정의가 상호 비교됩니다. 만일 양자가 다르면 [프로젝트 좌표계] 대화 상자가 나옵니다.

파일의 좌표계를 이용하고자 하면 [프로젝트 좌표계] 대화 상자에서 '데이터 컬렉터 정의로 전환' 옵션을 선택합니다.

파일의 좌표계가 '축척 계수만의 좌표계'만 아니라면, 프로젝트의 좌표계 정의는 이 파일의 좌표계로 바뀌게 됩니다.

파일의 좌표계가 축척 계수만의 좌표계 라면, 프로젝트의 좌표계 정의가 어떤 것이냐에 따라 그 결과가 달라집니다.

참조: 프로젝트의 좌표계가 '정의되지 않은 기본 투영법'이고 아무 포인트도 없다면, 파일의 좌표계가 자동 이용되고 프로젝트의 좌표계가 이 파일의 좌표계로 변경됩니다.


축척 계수만의 Survey Controller (*.dc) 파일 - 개요
정의된 좌표계가 없는 토탈 스테이션 파일(축척 계수만의) − 개요

개요

축척 계수만의 좌표계는 모든 관측을 광파 측량기로써 한 경우의 측량(즉, GPS 관측치가 없음)에 이용할 수 있습니다.

비GPS 관측치만 들어 있는 파일이 Trimble Geomatics Office에서 처리되는 방식은 Trimble Geomatics Office 프로젝트에서 정의된 좌표계가 어떠하냐에 따라 달라집니다.

정의되지 않은 기본 투영법

정의되지 않은 기본 투영법(원점 위도/경도가 없음)이 Trimble Geomatics Office 프로젝트에 있는 경우, [기본 투영법] 대화 상자 가 나옵니다. 사용자가 X 좌표 상수와 Y 좌표 상수, 축척 값을 입력할 수 있습니다.

경고: 데이터베이스에 이미 어떤 포인트가 있다면, 파일의 축척이 기본 투영법의 업데이트에 이용되지 않습니다. 도입 파일의 축척과 프로젝트 기본 투영법의 축척이 다르지 않도록 주의합니다.

정의된 좌표계

정의된 좌표계(원점 위도 값과 원점 경도 값이 정의되어 있는 기본 투영법 포함)가 Trimble Geomatics Office 프로젝트에 있다면 프로젝트 좌표계가 이용되고, 파일의 축척이 프로젝트 좌표계의 축척과 같다고 간주됩니다.


축척 계수만의 Survey Controller 파일 이용하기 (정의되지 않은 기본 투영법)
축척 계수만의 파일 이용하기 (정의되지 않은 기본 투영법)

 개요 및 추가 정보

  가져오는 파일에 축척 계수만의 투영법이 있고

  정의되지 않은 기본 투영법(즉, 원점 위도/경도가 정의되어 있지 않음)이 Trimble Geomatics Office 프로젝트에 있으며

  데이터베이스에 아무 포인트도 없는 경우,

[기본 투영법 정의] 대화 상자가 나옵니다.

이 대화 상자에 있는 필드:

X 좌표 상수

이 X 좌표 값은 파일에 있는 첫번째 포인트로부터 도출됩니다. 사용자가 가원점에 대한 값을 변경할 수 있습니다.

Y 좌표 상수

이 Y 좌표 값은 파일에 있는 첫번째 포인트로부터 도출됩니다. 사용자가 가원점에 대한 값을 변경할 수 있습니다.

축척 계수

축척 계수는 파일에 있는 마지막 축척 레코드로부터 도출됩니다. 사용자가 축척 계수에 대한 값을 변경할 수 있습니다.

참조: 파일에서 첫번째 포인트를 검색할 때, 삭제된 포인트는 고려되지 않습니다.

확인

[확인] 단추를 눌러 기본 투영 매개 변수를 적용합니다. 이 매개 변수들의 값은 프로젝트의 좌표계 정의에 쓰입니다. 매개 변수를 보려면 [파일 / 프로젝트 등록 정보] / [좌표계] 탭 하의 [자세히] 단추를 누릅니다.

참조: 기본 투영법이 아직 완전히 정의되지 않았기 때문에(즉, 원점 위도/경도가 아직 정의되지 않았음), 이 기본 투영법은 GPS 점이 하나 이상 들어 있는 파일을 가져올 때 업데이트되게 됩니다.

[로컬 사이트 설정] 대화 상자에서 [지상 좌표 이용] 확인란을 선택하지 않으면 해수면 보정 기능이 활성화되지 않습니다.


정의된 프로젝트 좌표계 하에서 축척 계수만의 파일 이용하기
정의된 프로젝트 좌표계 하에서 비GPS 파일 이용하기

Trimble Geomatics Office 프로젝트에 대한 좌표계가 정의되어 있고, 파일을 가져오는 경우, 프로젝트의 기존 좌표계가 이용된다는 메시지의 대화 상자가 나옵니다. 그 다음, 파일의 포인트가 도입됩니다.

Trimble Geomatics Office는 기존 좌표계의 프로젝트 축척과 지상 축척 계수가 이 파일의 축척과 같다고 간주합니다.

[로컬 사이트 설정] 대화 상자의 [지상 좌표 이용] 확인란이 선택되어 있지 않은 경우에는 가져오기를 하기 전에 이 축척들이 동일한 것인지, 그리고 파일의 축척 계수가 결합 축척 계수에 해당하는지 확인하여야 합니다.

[로컬 사이트 설정] 대화 상자의 [지상 좌표 이용] 확인란이 선택되어 있는 경우에는 Trimble Geomatic Office의 프로젝트 표고가 도입 데이터에 맞는 것인지 꼭 확인하도록 합니다.


[프로젝트 좌표계] 대화 상자

파일의 가져오기를 할 때, 이 Survey Controller 파일에 기록된 좌표계 정의가 프로젝트의 그것과 다르고, 또한 프로젝트의 좌표계가 정의되어 있을 경우(즉, 프로젝트 좌표계가 '정의되지 않은 기본 투영법'이 아닌 경우), 이 대화 상자가 나옵니다.

좌표계

파일의 좌표계를 이용하려면 '데이터 컬렉터 정의로 전환' 옵션을 선택합니다. 데이터베이스의 기존 데이터는 새 좌표계 정의로써 모두 업데이트 됩니다.

프로젝트 좌표계 정의 를 계속 유지하고자 하면 '기존 프로젝트 정의 유지' 옵션을 선택합니다. 데이터 컬렉터 파일의 데이터는 프로젝트 좌표계의 정의에 의거하여 해석됩니다.

프로젝트 좌표계나 Survey Controller 파일 좌표계의 내역을 보려면 해당하는 [자세히] 단추를 누릅니다.

요약

[요약] 단추를 누르면 이 두 좌표계의 비교 보고서를 볼 수 있습니다. 이 보고서를 이용하여 양 좌표계의 매개 변수를 전부 검토하고 그 차이점을 알아 봅니다.


Survey Controller 파일 가져오기 도중 [프로젝트 좌표계] 대화 상자 이용하기
파일 가져오기 도중 [프로젝트 좌표계] 대화 상자 이용하기

파일을 가져오는 경우, 이 파일에 기록된 좌표계 정의와 프로젝트의 좌표계 정의가 상호 비교됩니다. 프로젝트의 좌표계 정의를 이용하고자 하면 [프로젝트 좌표계] 대화 상자에서 '기존 프로젝트 정의 유지' 옵션을 선택합니다

정의되지 않은 기본 투영법

정의되지 않은 기본 투영법이 프로젝트의 좌표계일 경우, 기본 투영법 업데이트가 나옵니다. 파일의 첫번째 포인트가 기본 투영법의 업데이트에 쓰입니다.

기타 좌표계

파일은 프로젝트의 좌표계를 이용하여 가져오게 됩니다.

참조: 파일의 좌표계가 축척 계수만의 좌표계 라면, 프로젝트의 좌표계 정의가 어떤 것이냐에 따라 그 결과가 달라집니다.


Trimble Survey Office나 Survey Controller로부터의 Plane 투영법 이용하기
Trimble Survey Office나 Trimble Survey Controller로부터의 Plane 투영법 이용하기

Trimble Geomatics Office는 정의되지 않은 Plane 투영법을 업데이트하지 않을 것입니다.

  Trimble Survey Office 프로젝트에 Plane 투영법이 있는 경우, Trimble Survey Office로부터 Trimble 그래픽 파일(*.tgf)을 내보내거나

  Plane 투영법이 있는 Trimble Survey Office 프로젝트로부터 .dc를 내보낸 다음,

그 파일을 Trimble Geomatics Office로 가져온다면, Plane 투영법은 여전히 Trimble Geomatics Office 프로젝트에 이용할 수 있습니다. ([프로젝트 좌표계] 대화 상자가 나올 때 Survey Controller 파일 좌표계를 이용하는 옵션을 택하여야 함)

Plane 투영법이 그 프로젝트의 좌표계가 됩니다. 좌표계 내역을 보려면 [프로젝트 등록 정보] 대화 상자의 [좌표계] 탭을 이용합니다.


축척 계수만의 Survey Controller (.dc) 파일로써 망 조정 수행하기 (정의되지 않은 기본 투영법)
축척 계수만의 파일의 데이터로써 망 조정 수행하기 (정의되지 않은 기본 투영법)

비GPS 데이터 파일(즉, GPS 관측치가 없는 것)에는 축척 이외의 다른 매개 변수가 정의되어 있지 않은 좌표계가 있을 수 있습니다. 즉, 데이텀 변환이나 수평 조정, 수직 조정이 없습니다. 축척 계수만의 좌표계는 Trimble Survey Controller(버전 7.00 이상)에서 만듭니다.

망 조정은 좌표계를 정의하기 전에는 수행하지 못합니다. 따라서 Trimble Survey Controller로부터 축척 계수만의 작업을 Trimble Geomatics Office의 정의되지 않은 기본 프로젝트 좌표계로 가져오는 경우, 정의되지 않은 기본 투영법을 업데이트하도록 하는 대화상자가 나옵니다.

이 대화 상자에서 투영 원점에 대한 위도/경도와 XY좌표 상수 좌표를 입력하도록 합니다.


지구 회전 매개 변수

100 km보다 긴 기선을 처리한다면 기선 처리기는 지구 회전 매개 변수들을 이용하여 극 조류를 모델화합니다.

이 지구 회전 매개 변수들은, 특히 극 좌표는 International GPS Service(IGS)같은 기관에서 매주 .erp 파일로서 공표합니다. 해당 기선에 대한 현행 .erp 파일이 없다면 예측 극 좌표가 사용됩니다.

Windows 탐색기를 이용하여 관련 .erp 파일 모두를 프로젝트 폴더 하의 Data Files\Precise Ephemeris 폴더로 복사하도록 합니다. 기선 처리기는 필요한 경우 자동으로 이 폴더에서 이 파일들을 찾게 되는데 만약 이들을 찾지 못하는 경우에는 예측 값을 사용하게 됩니다.

참조: 어떤 .erp 파일을 2개 이상의 프로젝트에서 쓰는 경우에는 반드시 이 파일을 각각의 프로젝트에 복사하여야만 합니다.


High Precision Geodetic Network

Trimble Geomatics Office 시스템 설치 작업의 일환으로서 US State Plane 좌표계를 위한 HPGN(High Precision Geodetic Network) 데이텀 그리드 파일들이 제공됩니다. 이 파일들은 Trimble Common Files 폴더 하의 GeoData 폴더(일반적로 Program Files\Common Files\Trimble\GeoData)에 저장됩니다. HPGN 데이텀 그리드 파일들은 모든 미국 주에 이용 가능한 것은 아닙니다.

다음은 이 파일들의 그리드 파일 명명 규칙입니다.

  2개 문자의 주 식별자 + hpgn + la(위도)나 lo(경도), 파일 확장자는 .dgf. 예를 들어, California HPGN 그리드 파일은 Cahpgnla.dgf와 Cahpgnlo.dgf입니다.

Trimble Geomatics Office의 좌표계 관리는 WGS-84 타원체에 근거를 두고 있기  때문에 HPGN 데이텀 그리드(NAD83 (1986) 및 NAD83 (HPGN)간의 양방향 변환용으로 설계된)가 이 좌표계 모델에 깔끔하게 부합되지는 않습니다. 따라서 혼돈을 방지하기 위하여 본 소프트웨어는 이들 데이텀 그리드에 참조되는, 사전 정의된 좌표계 정의를 제공하지 않습니다.

사용자는 Coordinate System Manager 유틸리티 하에서 해당 HPGN 데이텀 그리드 파일들을 써서 자신의 데이텀 및 좌표계 정의를 설정할 수 있습니다.

방법:

1.	해당 주의 HPGN 데이텀 그리드 파일들을 참조하는 데이텀 정의를 새로 만듭니다.

2.	해당 State Plane 투영 매개 변수를 쓰고, 새로 만든  이 데이텀 정의를 참조하는 좌표계 정의를 새로 만듭니다.

알려진 HPGN 투영 좌표(또는 위도와 경도, 타원체고 값)로부터 NAD-83 (1986) 위도/경도 값을 얻기 위하여 Trimble Geomatics Office 프로젝트에서 이 새 좌표계 정의를 사용하도록 합니다.

다음을 실행합니다.

1.	HPGN 값을 그리드 좌표로서 입력하거나, 또는 로컬 위도/경도/타원체고 값을 적절하게 입력합니다.

2.	표시된 WGS-84 필드로부터 대응 NAD-83 (1986) 위도/경도 값을 읽습니다.

알려진 NAD-83 (1986) 위도/경도/타원체고 값으로부터 다음과 같이 HPGN 값을 구합니다.

1.	알려진 NAD-83 (1986) 위도/경도/타원체고 값을 WGS-84 값으로서 입력합니다.

2.	대응하는 HPGN 그리드 좌표나 위도/경도/타원체고 값을 그리드 필드나 로컬 필드로부터 각각 읽습니다.


New Brunswick (Canada) 좌표계

좌표계 데이터베이스에는 Stereographic Double 투영법과 Average Terrestrial System 1977 (ATS77) 타원체가 들어 있습니다. New Brunswick 좌표계를 설정하기 전에는 반드시 Geodetic Survey of Canada로부터 데이텀 그리드 및 지오이드 모델을 구입하여야만 합니다.

New Brunswick (Canada) 좌표계에서 쓰이는 내용:

  타원체: ATS77

  데이텀: NTv2 데이텀 그리드

  지오이드: HT101

  투영법: Stereographic Double:

� 중심 위도: 46° 30' 00" N

� 중심 경도: 66° 30' 00" W

� X 좌표 상수: 800 000 m

� Y 좌표 상수: 300 000 m

� 축척 계수: 0.999912

New Brunswick (Canada) 좌표계를 만드는 방법:

1.	Geodetic Survey of Canada로부터 구입한 HT101 지오이드 모델을 바탕으로 지오이드 그리드 파일(*.ggf)을 만듭니다(Grid Factory 유틸리티를 이용하여).

2.	Geodetic Survey of Canada로부터 구입한 NTv2 데이텀 그리드를 바탕으로 데이텀 그리드 파일(*lat.dgf, *lon.dgf)을 만듭니다(Grid Factory 유틸리티를 이용하여). 보다 자세한 내용은 Grid Factory 유틸리티 도움말을 참조하십시오.

3.	Coordinate System Manager 유틸리티로써 새로운 좌표계를 추가합니다. 상세한 사항은 Coordinate System Manager 유틸리티 도움말의 '[좌표계 추가] 명령' 항목을 참조하십시오.


용어 풀이

이 용어 풀이는 GPS와 Trimble Geomatics Office 소프트웨어에 관련된 전문 용어를 설명합니다. Microsoft Windows나 컴퓨터의 일반 용어는 다루지 않습니다.

심벌

1 시그마

A

사후 오차

선험 오차

AASHTO

정확도

조정 값

조정

조정 수렴

조정 데이텀

조정 스타일

대수 부호

알고리즘

위성력

모호 정수

주석

안테나 높이

안테나 페이즈 보정

Anti-Spoofing (AS)

APC

단독 측위

방위각

B

기지국

기선

기선 처리기

Baud

2 변량

C

CAD 스타일

캘리브레이션된 사이트

캘리브레이션 좌표

Cartesian 좌표

카이 자승 검정

시계 옵셋

폐합

CMR

Coarse Acquisition(C/A) 코드

코드

구성 요소

위성군

제약

제약 조건

기준점

광파 관측치

좌표계

상관 관계

공분산

공분산 행렬

공변값

현재 화면

사이클 슬립

D

데이터 로깅

데이터 메시지

데이텀

데이텀 결함

데이텀 변환

상관성 제거

연직선 편차

자유도

델타 표고

델타고

델타 N, 델타 E, 델타 U

델타 X, 델타 Y, 델타 Z

차동 측위

DOP

도플러 이동

이중차 방식

DTM

2 주파

E

지구 중심-지구 고정(ECEF)

Y 좌표

표고

임계 앙각

타원체

타원체 거리

타원체고

개체

위성 궤도력

에포크

에포크 간격

오차

오차 타원

이벤트

F

FastStatic

피쳐 및 속성 라이브러리 (*.fcl) 파일

피쳐 코드

필드 코드

최종해

고정

고정 좌표

고정해

편평률

역편평률

유동해

자유 조정

도수 분포

완전 제약

G

GDOP

측지 방위각

측지 데이텀

지리 좌표

지오이드

지오이드 모델

지오이드 관측치

지오이드 분리 간격

Geomatics

GPS

GPS 기선

GPS 관측치

GPS 원시 데이터

GPS 시간

그리드

그리드 변환

그리드 거리

지상 거리(Ground distance)

H

HDOP

높이 측정 막대

HI

히스토그램

수평 기준점

수평 거리

수평 위치

I

독립적

내적 제약 조건

정수 모호성

정수 검색

전리층 무영향

전리층

전리층 모델링(Ionospheric modeling)

반복 연산

J

K

Kinematic 측량

알려진 측점 초기화

L

L1

L2

라벨

레이어

최소 자승법

신뢰도

유의 수준

로컬 타원체

로컬 측지 좌표

로컬 측지 평면

루프형 폐합

M

장경축

도각

도법

평균 해수면

최소 제약

단경축

모델링

다중 경로

N

Narrow-lane

NAVDATA

망

망 조정

망 상태

NMEA

법선

정규 분포 곡선

법선면 방위각

X 좌표

O

관측 잔차

관측치

선점 시간

원점

정표고

OTF 검색법

이상값

과결정

P

P 코드

매개 변수

패리티

PDOP

PDOP 차단점

임계 PDOP

페이즈 센터

페이즈 센터 모델

연직 작업

포인트 위치

후처리

PPM

정밀 궤도력

정밀도

PRN

확률

최확값

프로젝트

프로젝트 데이텀

투영법

전파 오차

Q

QC 레코드

질 수용 테스트(Quality Acceptance test)

R

비율

RDOP

실시간 Kinematic

사각형 좌표

Reduced column profile

여유도

여유도 수

여유 기선

여유 관측치

기준 계수

기준계

기준국

기준 분산

상대 오차

잔차

RINEX

RMS

회전 자오선

회전

로버

RTCM

RTK

S

위성 기하

스칼라

스칼라 가중

축척

SDMS

Selective Availability (S/A)

장반경

단반경

세션

설치 오차

사이드샷

시그마

1 주파

사이트 캘리브레이션

하늘 플롯

사거리

SNR

해 유형

표준 오차

단위 가중치 표준 오차

State Plane 좌표

Static (측량)

Static 망

상태

확률 모델

하위망

Super-trak

측량 관측치

SV

심벌 및 선 형식

정오차

T

Tau (값)

Tau 기준

TDOP

비GPS 관측

TOW

추적 중

변환

변환 그룹

변환 매개 변수

Tribrach

대류권 보정

대류권 모델

Tribrach 센터링 오차

U

단변량

미지수

URA

US National

US Survey Foot

UTC

V

분산

분산 구성 추정

분산 그룹

분산-공분산 행렬

VDOP

벡터

연직선

수직 조정

수직 기준점

W

WAVE

가중치

가중 전략

가중치 집합

WGS-84

Wide-lane

X

X, Y, Z 축

Y

Y 코드

Z

천정 지연


1 시그마(1-sigma)

평균으로부터의 1 표준오차


사후 오차(Aposteriori error)

망 조정으로 도출되는 단위 가중치 표준 오차(기준 계수)를 선험 오차에 곱한 오차


선험 오차(Apriori error)

망 조정 이전 단계에서의 관측치 추정 오차


AASHTO

American Association of State Highway and Transportation Officials


정확도(Accuracy)

측정치가 실제의 참값에 근접하는 정도


조정 값(Adjusted value)

데이터의 오차를 제거하는 망 조정 과정을 거침으로써 관측 데이터(측정치)로부터 도출되는 값


조정(Adjustment)

보정값를 결정하고 이를 관측치에 적용함으로써 오차를 축소하는 망 조정 과정


조정 수렴(Adjustment convergence)

정해진 반복 연산 횟수 이내에 망 조정의 지정 잔차 허용 범위나 최종 잔차 허용 범위가 충족되는 것


조정 데이텀(Adjustment datum)

현재의 망 조정 반복 연산에서 쓰는 데이텀. Trimble Geomatics Office에서는 해당 프로젝트의 데이텀이나 WGS-84 중 하나를 선택할 수 있습니다.


조정 스타일(Adjustment style)

망 조정에 대한 Trimble의 기본 설정이나 사용자 정의의 설정


대수 부호

어떤 값을 양수나 음수로 지정하는 부호 (+ 또는 −)


알고리즘

유한 번의 단계 내에서 문제를 풀기 위한 규칙의 집합


위성력(Almanac)

GPS 위성이 전송하는 데이터로서 모든 위성의 궤도 정보와 시계 보정치, 대기 지연 파라미터 등이 포함됩니다.

위성력은 포착한 SV를 신속하게 이용할 수 있게 하는 수단이 됩니다. 위성력의 궤도 정보는 간단한 위성 궤도력이기 때문에 정밀도가 다소 떨어집니다.


모호 정수(Ambiguity)

재구성된 반송파 위상(중간에 끊기지 않은 측정치 집합에 포함된)의 사이클 수에 대한 알 수 없는 정수치. 수신기는 위성 라디오 파가 안테나를 지날 때 아주 정확하게 그 수를 셉니다. 그러나 셈을 시작하는 시점에 그 위성까지의 사이클 수는 알 수 없습니다. 위성과 안테나 사이에 존재하는 미지의 이 파장 수가 바로 모호 정수인데 정수 모호성(Integer ambiguity) 또는 정수 편기(Integer쟟ias)라고도 합니다.


주석(Annotation)

데이터베이스의 레코드를 설명하는 작은 문자열. 주석을 선택, 편집하려면 등록 정보 창을 이용합니다.

주석은 고정되어 버리는 것이 아닙니다. 다시 말해, 모개체(Parent entity)가 바뀌면 그때마다 필드도 같이 업데이트됩니다.


안테나 높이

관측점에서 위로 GPS 안테나 페이즈 센터까지의 높이.

보정전 안테나 높이는 관측점에서 안테나의 특정 지점까지 위로 잰 높이인데 소프트웨어 상에서 수동 또는 자동으로 실제 연직 높이로 보정이 됩니다.


안테나 페이즈 보정(Antenna phase correction)

GPS 안테나의 페이즈 센터는 위치가 정해져 있는, 어떤 물리적인 지점이 아닙니다. 위성으로부터 오는 신호의 방향에 따라 페이즈 센터도 바뀝니다. 페이즈 센터의 위치 변이는 그 대부분이 위성의 앙각에 의해 결정됩니다. 안테나 페이즈 센터의 이 위치 변이 내용을 모델화하면 하나의 측량에서 여러 종류의 안테나를 사용할 수 있게 됩니다. 2개의 똑 같은 안테나를 사용할 경우에는 공통 오차가 상쇄되기 때문에 안테나 페이즈 센터의 보정치가 그만큼 중요하지는 않습니다.


Anti-Spoofing (AS)

미 국방부는 위성에서 P 코드 대신 암호화된 Y 코드를 발신하도록 하는 권한이 있습니다. Y 코드는 인가자(주로 군대)만 이용할 수 있게 되어 있습니다. AS는 Selective Availability와 더불어 민간 사용자가 GPS의 정밀도를 완전히는 이용하지 못하게 제한하는 제도입니다.


APC

안테나 페이즈 센터(Antenna Phase Center)

안테나의 전자적 센터로서 실제의 물리적 센터와 일치하지 않는 경우도 있습니다. 라디오 신호는 APC에서 측정됩니다.

등록 정보 창에서 어떤 포인트의 높이는 APC의 표고일 수 있습니다. 즉 높이가 APC로 명시되어 있을 경우, 그것은 지표점의 높이가 아니라 APC의 높이입니다.


단독 측위(Autonomous positioning)

GPS 수신기가 기지국으로부터의 데이터가 없이 위성 데이터만으로 위치 픽스를 실시간 계산하는 작동 모드. 단독 측위법은 정밀도가 가장 낮은 GPS 측위법인데, 수평 RMS가 Selective Availability의 실행 중에는 �100 m, 실행 중이 아니면 �10--20쟭입니다. 절대 측위 또는 포인트 측위(Point positioning)라고도 합니다.


방위각

수평 기선과 측지 북방향이 이루는 각도. GPS 관측에서는 법선면 방위각을 말합니다.


기지국(Base station)

알려진 위치에 설치된 안테나와 수신기. 기지국은 실시간 Kinematic(RTK) 측량이나 차동 측량에 필요한데 후처리용 데이터는 기지국에 그대로 기록해 둘 수 있습니다. Trimble Reference Station(TRS) 소프트웨어나 Trimble Universal Reference Station 소프트웨어(URS) 같은 Trimble 기준국과, 기지국 모드하의 수신기가 바로 기지국의 한 예입니다.

GPS 측량 작업시 측량자는 기선(한 수신기를 기준으로 했을 때 다른 수신기의 상대적 위치)을 관측, 계산합니다. 다른 모든 미지점은 이 기지국을 기준으로 해서 도출되게 됩니다.


기선(Baseline)

한 지점을 기준으로 했을 때 다른 지점의 상대적 위치. GPS 측량에서는 한 수신기를 기준으로 했을 때 다른 수신기의 상대적 위치가 됩니다. 이 두 수신기로부터 취합한 데이터를 결합하면 양 스테이션간의 3차원 벡터를 구성하는 기선이 도출됩니다.


기선 처리기(Baseline processor)

위성 측정치로써 기선 해를 계산하는 컴퓨터 프로그램. PC에서 후처리용으로 이용하여도 되고 수신기에서 실시간 처리 프로그램으로 실행할 수도 있습니다. WAVE(Weighted Ambiguity Vector Estimator)는 Trimble의 기선 처리기입니다.


Baud

직렬 통신을 설명할 때 쓰는 데이터 전송 속도(2진 디지털 장치 사이)의 단위


2 변량(Bivariate)

다음 항목에 대한 오차 타원에서 2차원 우연 오차(Random error)의 성격을 설명하는 수학 함수

  X 좌표/Y 좌표

  위도/경도

  X/Y


CAD 스타일

CAD 스타일은 프로젝트에서 포인트나 선, 호, 곡선, 문자열, 주석 등의 모양을 결정하는데 그 구성 요소는 심벌이나 선 형식, 색상, 글꼴 등입니다. 스타일 정의는 프로젝트에 저장됩니다.

스타일을 여러 프로젝트에 이용하고자 하면 이것을 템플리트 프로젝트에 정의하도록 합니다.


캘리브레이션된 사이트(Calibrated site)

사이트는 기존의 좌표계 정의에다 별도의 보정 변환을 이용함으로써 정의합니다. 이는 특정 지역(또는 사이트)에서 GPS 데이터를 최적합화하는 기능을 합니다.

좌표계는 광범위한 지역을 그 적용 대상으로 하고 로컬 좌표의 지역적 차이는 달리 고려하지 않기 때문에 별도의 보정 변환이 필요한 것입니다.

새 작업은 기존의 기준점에 잘 부합되게 할 필요가 있는데 별도의 보정 변환을 하면 이러한 지역적 변이가 보정되게 됩니다. 별도의 이 보정값은 제한된 지역에서만 유효하다고 해서 '사이트'라는 용어를 씁니다.

Trimble Geomatics Office 소프트웨어는 로컬 기준점과의 부합에 필요한 변환 계산을 수행한 후, 이 정의 내용을 좌표계 데이터베이스에 저장할 수 있습니다.


캘리브레이션 좌표(Calibration coordinate)

최소 제약된(Minimally constrained) 망 조정으로부터 도출한 것으로서, 추후의 GPS 사이트 캘리브레이션에 이용하고자 저장해둔 WGS-84 좌표(위도/경도/타원체고)

이 좌표는 캘리브레이션 작업시, 특정 지점의 그리드 좌표와 연관된 GPS 관측 좌표로서 이용됩니다.


Cartesian 좌표

지구 중심-지구 고정 Cartesian 좌표 참조


카이 자승 검정(Chi-square test)

망 조정의 전반적인 통계적 검정 방법. 이것은 잔차 가중 제곱의 합, 자유도 수, 95% 이상의 임계 확률에 대한 검정입니다.

이 검정의 목적은 예측 오차가 정확하게 추정되었다는 가설을 채택하거나 기각하는 것입니다.


시계 옵셋(Clock offset)

2개의 시계 사이에 발생하는 일정한 시간 차이. GPS에서는 일반적으로 SV 시계와 수신기 시계와의 옵셋을 이릅니다.


폐합(Closure)

망의 알려진 부분과 측정된 부분이 서로 일치하는 것


CMR

Compact Measurement Record

베이스로부터 로버까지의 정확한 기선 벡터를 계산하기 위하여 기지 수신기에서 방송하는 위성 측정 메시지로서 실시간 Kinematic(RTK) 측량에서 이용


Coarse Acquisition(C/A) 코드

L1 신호에 변조되어 있는 Pseudorandom noise(PRN) 코드. 이 코드는 수신기가 위성으로부터 떨어진 거리를 계산하는 데 이용됩니다.


코드

GPS 코드는 GPS 반송파 신호에 변조되어 있는 Pseudorandom noise(PRN) 코드입니다.

C/A 코드는 민간 사용자가 별다른 제한 없이 이용할 수 있는 코드입니다.

P 코드도 특별한 이용 제한이 있지는 않지만 국가 방위 목적상 암호화될 수 있습니다.

코드 측정치는 GPS 항법과 측위의 기본 바탕이 됩니다. 또한 코드는 반송파 위상 측정치와 더불어, 보다 정확한 '측량 등급' 기선 해를 얻는 데에도 이용합니다.


구성 요소(Component)

두 기준점간의 3차원 기선을 정의함에 필요한 측량 관측치 3 개 중 하나. 똑 같은 기선을 '방위각, 델타고, 거리(타원체 좌표)'나 '델타 X, 델타 Y, 델타 Z(지구 중심 Cartesian 좌표)', '델타 N, 델타 E, 델타 U(로컬 평면 좌표)'로 정의할 수 있습니다.


위성군(Constellation)

위치 계산에 이용되는 특정 집합의 위성: 2 차원 위치 결정에는 3개의 위성, 3 차원 위치 결정에는 4개의 위성.

특정 시점에 어떤 GPS 수신기에 포착되는 모든 위성. 최적 위성군은PDOP가 가장 낮은 위성군입니다 . PDOP 참조


제약(Constrained)

망 조정에서 어떤 수량치(관측치와 좌표)를 참값으로 고정하는 것


제약 조건(Constraint)

망 조정에서 조정 가능한 어떤 수량치(관측치와 좌표)에 가하는 외적 제한


기준점(Control point)

그 좌표가 이미 측량 관측치로써 결정되었거나 결정 과정에 있는 표식점


광파 관측치

토탈 스테이션이나 데오드라이트를 이용한 현장 관측치


좌표계

GPS 좌표(WGS-84 타원체 기준의)를 지오이드 기준의 표고 값이 있는 투영 좌표로 바꾸는 일단의 변환 요소.

좌표계의 구성 요소는 데이텀 변환, 지오이드 모델, 좌표 투영법입니다.

데이텀 변환은 좌표계 데이터베이스에서 정의되는데, 좌표 투영의 기초가 되는 데이텀의 정의가 포함되어 있습니다.

기존 지오이드 모델을 좌표계에 지정할 수도 있지만, 지오이드 모델 대신 지오이드 분리 간격 상수를 정의하는 방식으로 해도 됩니다. 좌표계 데이터베이스에서 지오이드 모델을 정의하려면 Trimble Coordinate System Manager� 유틸리티를 이용합니다.

좌표계에 지정할 수 있는 좌표 투영법은 Transverse Mercator나 Lambert One Parallel 등 여러 가지가 있습니다. 투영 좌표를 유도할 때 발생하는 왜곡 현상을 최소화하여 최적 결과를 얻기 위하여 각 나라나 지역에 따라 서로 다른 투영법을 이용합니다. 좌표 투영법은 해당 데이텀상의 위도/경도 값을 Cartesian 좌표 값으로 전환하는 역할을 하고, 지오이드 모델은 그 투영 좌표에 대한 표고 값을 계산하는 기능을 담당합니다.

Trimble Coordinate System Manager 유틸리티를 이용하면 Trimble Geomatics Office 소프트웨어에 딸려 있는 좌표계의 정의를 보거나 편집, 추가할 수 있습니다.


상관 관계(Correlated)

2 개 이상의 관측치(또는 도출된 수량치)가 최소한 하나 이상의 공통되는 오차원(Source of error)이 있을 경우


공분산(Covariance)

2 개의 관측치(또는 도출된 수량치) 사이의 오차 상관 관계를 표시하는 척도. 분산-공분산 행렬에서는 대각선상 밖의 항을 의미(즉, 분산이 아님)하기도 합니다.


공분산 행렬(Covariance matrix)

관측치의 분산과 공분산을 정의하는 행렬. 대각선상의 원소는 분산이고 대각선 양쪽의 원소는 모두 공분산입니다.


공변값(Covariant value)

망 조정의 결과, 기준점 쌍 사이의 방위각과 거리, 타원체고에 생기는 전파된(계산된) 사후 오차(그 공표된 값을 Trimble Geomatics Office 소프트웨어에서 이용). 공변이라는 용어는 이 계산 과정에 있어 조정된 기준점의 분산-공분산 행렬의 공변항이 이용된다는 것을 의미합니다.


현재 화면

[창 / 새 창] 명령을 이용함으로써 화면 설정 내용이 서로 다른 창을 여러 개 불러올 수 있습니다. 현재 화면은 제목 표시줄이 활성화되어 있는 것입니다.


사이클 슬립(Cycle slip)

위성 라디오 신호의 수신 중단. 사이클 슬립이 있으면 기선 처리시 정수 모호성 항의 재추정이 필요하게 됩니다.


데이터 로깅(Data logging)

위성 데이터를 수신기나 데이터 컬렉터(Trimble Survey Controller 소프트웨어가 실행 중인), PC 카드의 파일에 기록하는 과정


데이터 메시지

GPS 신호에 들어 있는 메시지로서 시계 보정치, 그 위성의 위치/양호성 여부에 대한 정보 뿐만 아니라 다른 위성의 근사 위치/양호성 여부 등에 대한 정보도 들어 있습니다.


데이텀(Datum)

지오이드의 전부 또는 일부에 부합하게 고안된 지구의 수학적 모델. 데이텀은 지형면 상에 데이텀 원점으로 설정된 지점과 타원체간의 관계에 의해 결정됩니다. 일반적으로 측지 데이텀이라고도 합니다.

세계 측지 데이텀은 일반적으로 (1)타원체의 모양과 크기 (2)지구 중심을 기준으로 한 타원체 중심의 위치에 의해 정의됩니다.


데이텀 결함(Datum defect)

좌표 집합 2 개 사이의 알 수 없는 불일치. 망 조정 작업의 일환으로 데이텀 변환을 함으로써만 교정할 수 있습니다.


데이텀 변환(Datum transformation)

한 데이텀상의 좌표를 다른 데이텀 좌표로 전환하는 변환법의 정의.

Trimble Geomatics Office 소프트웨어에서 지원하는 데이텀 변환 방법은 여러 가지가 있습니다.

  7 매개 변수법

  3 매개 변수법 (Molodensky법이라고도 함)

  데이텀 그리드법

  다중 회귀법

데이텀 변환은 GPS 방식으로 수집한 WGS-84 데이텀 데이터를 로컬 데이텀(각 지역별, 나라별로 다른) 상의 데이터로 전환하여 측량이나 지도 제작용으로 쓰고자 할 때 이용합니다.


상관성 제거(De-correlate)

관측치 사이의 공분산을 제거하는 것. 정교한 직교 변환 작업을 하거나 수직, 수평 조정을 따로 계산함으로써 공분산을 제거할 수 있습니다.


연직선 편차(Deflection of the vertical)

지오이드 수직선(연직선)과 타원체 수직선(법선) 사이의 각도 차이


자유도(Degree of freedom)

망 여유도의 척도


델타 표고

두 지점 사이의 표고 차


델타 고도
델타고

Trimble Geomatics Office 소프트웨어에서 GPS 기선의 수직 구성 요소. 타원체고의 차이(Difference) 또는 증감(Change)


델타 N, 델타 E, 델타 U

로컬 측지 평면 좌표계에서 쓰는 좌표 차이의 표시 방법


델타 X, 델타 Y, 델타 Z

Cartesian 좌표계에서 쓰는 좌표 차이의 표시 방법


차동 측위(Differential positioning)

동일한 위성들을 동시에 추적 중인 두 수신기의 상대 위치를 정밀하게 측정하는 것


DOP

Dilution of Precision

GPS 위치의 질을 나타내는 지표. DOP는 위성군(Constellation)에서 한 위성의 다른 위성에 대한 상대 위치와, GPS 수신기에 대한 위성들의 기하 구조에 의해 결정됩니다. DOP 값이 작을수록 정확도가 높아집니다. GPS의 표준 DOP:

  PDOP 위치 (3 개 좌표)

  HDOP 수평 (2 개 수평 좌표)

  RDOP

  VDOP 수직 (타원체고)

  TDOP 시간 (시계 옵셋)


도플러 이동(Doppler shift)

위성과 수신기의 상대적인 움직임에 의해 어떤 신호의 주파수에 야기되는 변화


이중차 방식(Double differencing)

동일한 위성들을 추적하는 두 수신기가 동시 측정한 반송파 위상의 차를 이용하는 산술적 방식으로서 위성과 수신기의 시계 오차를 제거합니다.


DTM

수치 지형 모델(Digital Terrain Model)

3차원의 전자적 지형 표현


2 주파(Dual-frequency)

GPS 위성의 L1 신호와 L2신호를 모두 이용하는 수신기. 2 주파 수신기는 전리층 지연을 보정하기 때문에 거리가 길고 조건이 나쁘더라도 보다 정밀하게 위치 결정 계산을 할 수 있습니다.


지구 중심-지구 고정(ECEF)

WGS-84 기준계에서 쓰는 Cartesian 좌표계로서 그 원점은 지구 질량 중심입니다. Z 축은 지구의 평균 회전축과 일치하고 X 축은 0컿N과 0컿E 지점을 지나며, Y 축은 X, Z 축의 평면과 수직을 이룹니다.


경거(Easting)
Y 좌표(Easting)

동 방향의 그리드 값. 그리드의 왼쪽에서 오른쪽(X 축)


표고(Elevation)

평균 해수면상의 높이 또는 지오이드상의 연직 거리를 말하는데 정표고라고도 합니다.


임계 앙각(Elevation mask)

보통 13도로 설정되는 각도. 이 각도의 위에 위치한 위성을 이용하는 경우에는 건물과 나무에 의한 방해나 다중 경로 오차를 피할 수 있습니다.

Trimble은 앙각이 13도 미만인 위성의 이용을 권장하지 않습니다.


타원체(Ellipsoid)

단경을 축으로 해서 어떤 타원을 회전시킬 때 형성되는 수학적 지구 모델. 지구 타원체에 있어 단경은 극 단경, 장경은 적도 장경을 각각 의미합니다.

타원체를 정의하려면 '장단경 길이'나 '장경 길이 및 타원체 편평률'을 명시하여야 합니다.

두 가지 요소만 있으면 타원체를 정의할 수 있는데 주로 장반경(a)과 편평률(f)을 이용합니다.

편평률 [image] (여기서 b는 단반경)


타원체 거리(Ellipsoid distance)

Trimble Geomatics Office에서 타원체 거리는 두 지점 사이의 법선면 길이입니다.

주의: 타원체 거리와 측지선 거리는 다릅니다.


타원체 고도(Ellipsoid height)
타원체고(Ellipsoid height)

타원체면으로부터 어떤 지점까지 법선을 따라 잰 거리


개체(Entity)

그래픽 창에서 보고 선택할 수 있는 기본 그래픽 요소.

Trimble Geomatics Office에서의 개체는 포인트, 선, 호, 곡선, 문자열, 주석입니다.


위성 궤도력(Ephemeris)

천체 물체의 위치를 시간 함수로 설명하는 데이터 집합. 각 GPS 위성은 자신의 예상 미래 위치를 나타내는 방송 궤도력(관제소로부터 전송받은)을 주기적으로 송신합니다. 후처리 프로그램에서는 위성의 정확한 과거 위치를 나타내는 정밀 궤도력을 이용할 수도 있습니다.


에포크(Epoch)

GPS 수신기의 측정 간격. 에포크는 측량의 종류에 따라 달라집니다.

  실시간 측량에는 1초로 설정

  후처리 측량에는 1초에서 1분 사이의 간격으로 설정


에포크 간격(Epoch interval)

GPS 수신기에서 쓰는 측정 간격으로서 사이클이라고도 합니다.


오차

측정 값과 실제 값과의 차이. 일반적으로 측량 오차는 3가지 범주(과오, 정오차, 우연 오차)로 구분할 수 있습니다. 최소 자승 분석은 과오(Blunder)와 정오차(Systematic error)의 탐지 및 제거에 이용하고, 최소 자승 조정은 우연 오차(Random error)의 측정 및 정확한 배분에 이용합니다.


오차 타원(Error ellipse)

좌표 오차 타원은 망 조정된 포인트의 오차 크기와 오차 방향을 그래픽으로 표현한 것입니다.


이벤트(Event)

항공 사진 카메라의 셔터를 닫는 것과 같은 이벤트의 발생 레코드. GPS 수신기는 문자/숫자 메모(키패드로 입력된 이벤트 설명)와 이벤트 시간이 수록된 이벤트 마크를 로그할 수 있습니다. 이벤트는 키패드를 통하여 촉발될 수도 있고 수신기 포트로의 전기 신호 입력에 의해 촉발될 수도 있습니다.


FastStatic

최고 20 분까지의 선점(Occupation)으로 GPS 원시 데이터를 수집한 다음, 후처리를 하는 GPS 측량법으로서 센티미터 미만 수준의 정밀도를 보입니다. 대체로 선점 시간은 이용하는 위성(SV)의 수에 따라 달라집니다.

  4 SV시 20 분 소요*

  5 SV시 15 분 소요*

  6 SV 이상시 8 분 소요*

(*15 초 에포크 율로 수집)


피쳐 및 속성 라이브러리 (*.fcl) 파일

피쳐 코드와 속성, CAD 스타일, 제어 코드의 정의가 들어있는 텍스트 파일


피쳐 코드(Feature code)

피쳐를 설명하는 말이나 약어


필드 코드(Field code)

Trimble Geomatics Office 소프트웨어에서 어떤 정보를 보고서나 파일, 주석에 삽입하도록 특별히 지시하는 명령.

필드 코드는 'ASCII 가져오기/내보내기/보고서' 작업에서 데이터베이스 데이터의 전송 처리에 이용됩니다.


최종해(Final solution)

후처리 방식으로 GPS 벡터를 유도하는 경우(특히 Static 해에 대하여), 기선 처리기는 여러 가지의 처리 테크닉을 바탕으로 GPS 측정치를 다양하게 조합함으로써 서로 다른 해를 도출해 나가는 과정을 밟습니다. 일반적으로 볼 때, 뒤이어 도출되는 해가 직전의 해보다 양호합니다. 최종해는 가장 정확한 GPS 벡터 추정치입니다.


고정(Fixed)

제약(Constrained) 참조


고정 좌표

망 조정시 이동하지 않는 포인트 좌표


고정해(Fixed solution)

기선 처리기가 충분한 신뢰도로써 정수 모호성 검색(최적의 정수 집합을 선정하는)을 할 수 있는 상태에서 얻은 해. 모호 정수가 추정 유동값으로부터 적합한 정수값으로 모두 고정되기 때문에 고정해라는 이름이 붙습니다.


편평률(Flattening)

타원체 장단경축의 상대적 길이를 표현하는 수식


역편평률(Flattening inverse)

읽고 수정하기가 한결 용이한 편평률 식


유동해(Float solution)

기선 처리기가 충분한 신뢰도로써 정수 모호성 검색(최적의 정수 집합을 선정하는)을 할 수 없는 상태에서 얻은 해. 소수부가 있어 모호 정수가 정수가 아니기 때문에 유동해라는 이름이 붙습니다.


자유 조정(Free adjustment)

제약된(Constrained) 포인트(좌표)가 없는 망 조정의 실행. 이 망 조정은 내적 제약 조건(Inner constraint)을 이용합니다.


도수 분포(Frequency distribution)

데이터 집합에 있는 잔차의 크기와 분포 형태. 히스토그램에서 그래프로 표시


완전 제약(Fully constrained)

망의 모든 포인트(더 큰 제어망의 일부분인)를 각자의 공표 좌표 값에 고정시키는 망 조정. 작은 망을 더 큰 제어망에 병합하고 오랜된 망을 새 망으로 병합함에 이용


GDOP

Geometric Dilution of Precision

사용자의 위치/시간 오차와 위성 거리 오차 사이의 관계. DOP 참조


측지 방위각(Geodetic azimuth)

측지 자오선과 관측자의 측지선 접선이 이루는 각도로서 관측자의 타원체 법선에 수직인 평면에서 측정. 북방을 기준으로 시계 방향


측지 데이텀(Geodetic datum)

지오이드에 가장 근사한 타원체.

측지 데이텀은 (1)타원체의 모양과 크기 (2)지구 중심을 기준으로 한 타원체 중심의 위치에 의해 정의됩니다.

테이텀은 각 지역의 특성에 맞게 여러 종류가 개발되어 있습니다. 예를 들어, 유럽 지도는 European datum of 1950(ED-50)을, 미국 지도는 North American Datum of 1927이나 1983(NAD-27, NAD-83)을 토대로 하는 경우가 많습니다. 모든 GPS 좌표는 WGS-84 데이텀을 기준으로 합니다.


지리 (측지) 좌표

위도, 경도, 타원체고


지오이드(Geoid)

평균 해수면(MSL)과 거의 일치하는 중력 등포텐셜. 지오이드는 균일한 수학적 모양이 아닙니다. 실제로는 불규칙한 형태이며 그 전체 모양은 타원체와 유사합니다.

일반적으로 어떤 지점의 표고는 해당 지오이드를 기준으로 하여 측정됩니다. 하지만 GPS에서 쓰는 타원체고는 WGS-84 데이텀(수학적 수치)에 의한 개념입니다.

WGS-84 데이텀과 지오이드간의 관계를 설명하는 단일 수학적 정의는 없기 때문에 그 상호 관계는 측정에 의해 결정됩니다. 광파식 측량법으로써 표고(지오이드 기준)를 측정한 다음, 이것을 그 지점의 WGS-84 타원체고와 비교를 합니다.

지오이드와 WGS-84 데이텀 사이의 분리 간격(Separation, 지오이드 분리 간격)에 대한 관측치를 아주 많이 수집하면 분리 간격 값의 그리드 파일을 만들 수 있습니다. 그 중간 지점에 대해서는 보간법을 이용하여 분리 간격을 적용할 수 있습니다. 지오이드 분리 간격의 그리드가 있는 파일을 지오이드 모델이라 하는데, 만일 어떤 WGS-84 위치가 이 지오이드 모델의 범위 안에 있게 되면 보간법을 이용하여 그 지점에 대한 분리 간격의 값을 유도해 낼 수 있습니다.


지오이드 모델

특정 지역이나 지구 전체의 지오이드에 대한 수학적 표현. 망 포인트의 지오이드 분리 간격은 이 모델을 이용하여 유도해 냅니다.


지오이드 관측치

지오이드 모델에서 유도한 지오이드 분리 간격으로서, 관련된 오차가 있습니다. Trimble Geomatics Office의 망 조정에서는 지오이드 관측치를 여느 관측치(관련된 오차가 있는)와 똑 같은 방식으로 취급합니다.

지오이드 관측치는 조정을 거침으로써 조정된 지오이드 관측치가 됩니다.


지오이드 분리 간격(Geoid separation)

어떤 지점에 있어서 그 지오이드와 타원체 사이의 거리


Geomatics

공간 정보(Spatial information)의 설계 및 수집, 저장, 분석, 디스플레이, 검색. 공간 정보는 GPS 법이나 비GPS 법 등 다양한 방식으로 수집할 수 있습니다. Geomatics는 전통적인 측량법을 현대의 첨단 테크놀러지로 통합한 것으로서 무한한 응용 잠재력이 있습니다.


GPS

Global Positioning System

GPS는 지구 궤도를 도는 24 개의 위성을 그 근간으로 합니다.


GPS 기선

2개의 스테이션에서 GPS 데이터를 동시에 수집하고 이를 차동 테크닉으로 처리하는 3차원 측정.

'델타 X, 델타 Y, 델타 Z' 또는 '방위각, 거리, 델타고'로 표현


GPS 관측치

관련된 오차가 있는GPS 기선. 조정을 거치면 조정된 GPS 관측치가 됩니다.


GPS 원시 데이터

나중에 처리할 목적으로 GPS 수신기에서 수집한 데이터. 데이터 파일의 형태는 .dat 파일(Trimble 원시 데이터 파일 포맷)이나 RINEX 파일.


GPS 시간

NAVSTAR GPS 시스템에서 쓰는 시간 척도. GPS 시간은 UTC(Universal Time Coordinated)를 바탕으로 하지만 지구 자전 주기의 변화를 보정하고자 주기적으로 윤초를 추가하지는 않습니다.


그리드(Grid)

지도 투영과 같은 2차원의 평면 사각형 좌표계


그리드 변환(Grid conversion)

지리 좌표와 지도 투영 좌표 상호간의 변환


그리드 거리(Grid distance)

두 지점 사이를 투영 좌표로써 표현한 거리


지상 거리(Ground distance)

두 지표점 사이의 거리(곡률이 적용된 수평 거리)


HDOP

Horizontal Dilution of Precision


높이 측정 막대(Height measurement rod)

외부형 GPS 안테나에 딸려 있는 측정 도구로서 안테나의 지상 높이를 재는 도구


HI

기계고(Height of instrument)

GPS의 안테나 높이와 동의어


히스토그램(Histogram)

망 조정에서 잔차의 크기와 분포를 그래프로 표시한 것


수평 기준점(Horizontal control point)

수평 좌표의 정확도만 있는 포인트. 표고나 타원체고의 정확도는 낮은 순위이거나 알 수 없습니다.


수평 거리

두 지점 사이의 거리로서 한 포인트의 표고점에서 다른 포인트로 수평 방향으로 잰 거리


수평 위치(Horizontal position)

수평 좌표만 있는 포인트


독립적(Independent)

기하 구조나 오차에 의해 연결되지 않은 하위망, 관측치, 기준점. 상관 관계(Correlated)의 반대 개념


내적 제약 조건(Inner constraint)

어느 포인트의 좌표도 고정함이 없이 계산한 망 조정. Trimble Geomatics Office 소프트웨어에서는 망의 중심점(Centroid)을 내적 제약 조건으로 씁니다.


정수 모호성(Integer ambiguity)

GPS 위성과 GPS 수신기 사이의 반송파 위상 의사거리(Pseudorange)에 있는 사이클의 정수


정수 검색(Integer search)

GPS 기선 처리는, 실시간이나 후처리를 불문하고, 가능한 최상의 결과값을 얻으려면 고정 정수 해가 필요합니다. 소프트웨어에서 기선 유도용 GPS 측정치를 처리할 때 정수 검색 과정을 거쳐 고정 정수 해를 도출하게 됩니다. 이 검색 과정은 정수값의 조합을 여러 가지로 시도하여 그 중 최상의 결과값을 선택하는 단계를 거칩니다.


전리층 무영향(Iono free)

Ionospheric free solution(IonoFree), 전리층 무영향 해

GPS 측정치의 조합을 이용함으로써 전리층이 GPS신호에 미치는 영향을 모델화하고, 이를 제거하는 해. 이 해는 기준점 측량에 이용되는데, 긴 기선의 관측시 특히 유용합니다.


전리층

지상 80 ~ 120 마일 사이에 있는 전하 입자의 층으로서, 길이가 긴 기선을 1주파 수신기로써 측정하는 경우, GPS 측정치의 정확도에 영향을 미칩니다.


전리층 모델링(Ionospheric modeling)

전리층에 의한 시간 지연은 GPS 신호의 주파수에 따라 달라지고 L1과 L2에 미치는 영향도 서로 다릅니다. 2주파 수신기를 사용할 경우에는 양 주파수에 대한 반송파 위상 관측치로써 대부분의 전리층 영향을 모델화하여 제거할 수 있습니다. 2주파 측정치를 이용할 수 없는 경우에는 GPS 위성에서 방송하는 전리층 모델을 써서 전리층의 영향을 줄일 수 있지만 2주파 측정치를 이용하는 것만큼 효과적이지는 않습니다.


반복 연산(Iteration)

관측치 방정식, 정규 방정식, 좌표 조정, 잔차 계산 등으로 구성되는 조정 계산의 완전한 집합


Kinematic 측량

최소한 4개 위성과의 록(Lock)을 유지하는 상태에서 짧은 Stop and Go 선점으로 진행하는 GPS 측량법. 실시간이나 후처리 모두 가능하며 센티미터 수준의 정밀도를 보입니다.


알려진 측점 초기화(Known point initialization)

알려진 측점은 Kinematic 초기화와 함께 이용됩니다. 2개의 알려진 측점을 이용할 수 있다면 기선 처리기가 양자간의 인버스를 계산하여 초기화 벡터를 유도할 수 있는데, 이 초기화 벡터는 정수 모호성의 해결에 이용됩니다. 처리기가 이 모호 정수를 결정해 내는 경우에는 고정 정수 해가 가능하여 Kinematic 측량의 최적해가 도출됩니다.


L1

GPS 위성에서 위성 데이터의 전송에 이용하는 L 밴드 주반송파. 주파수는 1575.42쟋Hz이고 C/A 코드와 P 코드, 항법 메시지가 변조되어 있습니다.


L2

GPS 위성에서 위성 데이터의 전송에 이용하는 L 밴드 부반송파. 주파수는 1227.6�MHz이고 P 코드와 항법 메시지가 변조되어 있습니다.


라벨(Label)

프로젝트의 포인트에 지정해 둘 수 있는 정보. 포인트의 옆에 표시되므로 그 포인트를 쉽게 찾을 수 있습니다. 라벨은 '측량 보기'와 '평면도 보기'에서 화면에 표시됩니다.

Trimble Geomatics Office 소프트웨어에 설정되어 있는 라벨 정의를 이용하여 포인트의 라벨(예: 포인트 이름, 피쳐 코드, 표고)을 붙일 수 있습니다.

라벨의 글꼴과 크기는 사용자가 Microsoft Windows '화면 배색'의 '도구 설명' 항목에 대하여 설정해 둔 내용대로 적용됩니다.

데이터베이스의 포인트에 어떤 라벨을 지정하려면 [보기 / 포인트 라벨] 명령을 선택합니다.


레이어(Layer)

함께 그룹화된 데이터를 저장하는 장소.

데이터를 레이어별로 조직화하면 그 관리 작업이 용이해집니다. 레이어는 한 프로젝트에서 원하는 수만큼 보유할 수 있는데, 어떤 개체를 레이어에 지정 또는 재지정하려면 등록 정보 창을 이용합니다. 레이어 이름은 최고 100자까지의 문자/숫자가 들어갈 수 있습니다.


최소 자승법(Least squares)

확률 이론을 바탕으로 하여 관측치를 수학적으로 조정하는 방법으로서, 모든 가중 잔차 제곱의 합이 최소화됩니다.


신뢰도(Level of confidence)

결과에 대한 신뢰 수준의 척도로서 백분율이나 시그마로 표시


유의 수준(Level of significance)

확률 표현식. 1 시그마 (표준) 오차의 유의 수준은 68%입니다. 1차원 오차의 경우, 95%의 유의 수준은 1.96 시그마로, 99%의 유의 수준은 2.576 시그마로 각각 표시됩니다.


로컬 타원체(Local ellipsoid)

어떤 좌표계에 지정된 타원체. WGS-84 좌표는 먼저 이 타원체로 변환된 다음, 그리드 좌표로 다시 전환됩니다.


로컬 측지 좌표(Local geodetic coordinate)

로컬 타원체를 기준으로 한 위도, 경도, 타원체고


로컬 측지 평면(Local geodetic horizon)

어떤 타원체고점 상의 평면으로서 그에 대응하는 타원체 점(지표상의 그 지점을 지나는 법선이 타원체와 만나는 점)의 접평면과 평행을 이루는 면. 로컬 측지 평면의 좌표 값은 'North, East, Up'입니다. LGH는 해당 타원체에서 기선을 모델화 하기에 앞서 EC Cartesian 좌표 차이값의 회전에 이용됩니다. LGH 요소로부터 계산된 방위각 값은 타원체 모델화의 일환으로서 스큐 법선에 대한 보정 작업을 하여야 합니다.


루프형 폐합(Loop closure)

루프형 폐합은 어떤 망 내의 관측치 집합에 있는 오차량을 나타내게 됩니다.

어떤 포인트(이 포인트로부터의 관측치가 하나 또는 그 이상 있는)를 선택한 후, 그 관측치 중 하나를 이 포인트의 좌표에 추가하고, 이를 바탕으로 해서 두 번째 포인트의 좌표를 계산합니다. 이 과정은 루프를 따라 한 번 이상 반복되고 마지막으로 원래의 시작 지점에서 끝나게 됩니다. 관측치에 오차가 없다면 최종 계산 좌표는 원래의 시작 좌표와 똑 같게 되는데, 원래 좌표에서 이 계산 좌표를 빼면 폐합 오차가 결정됩니다. 이 오차를 선의 길이로 나누면 Parts per million으로 표시됩니다.

이 테크닉은 서로 다른 두 포인트(이 두 좌표의 정확도가 아주 높을 때) 사이에 이용할 수도 있습니다. 루프형 폐합을 트래버스 폐합이라고도 부릅니다.


장경축(Major axis)

타원체 참조


도각(Mapping angle)

특정 지점의 경도 자오선이 어떤 투영법상의 도북과 이루는 각도로서 수렴(Convergence)이라고도 합니다.


도법(Mapping projection)

타원체 곡면을 사각형 좌표 그리드로 표현하는 정밀한 수식


평균 해수면

모든 조수 단계를 감안한 해수면의 평균 높이로서 표고 기준점으로 이용


최소 제약(Minimally constrained)

좌표계를 정의하기에 충분한 제약 조건만 쓰는 망 조정. 관측치의 내적 일치성을 측정하는 용도에 이용


단경축(Minor axis)

타원체 참조


모델링(Modeling)

정의된 좌표계(예: 타원체 등)에서 어떤 관측치와 그 관련 오차를 수학적, 기하학적으로 표현하는 것


다중 경로(Multipath)

GPS 신호가 서로 다른 경로를 거쳐 안테나에 도달할 때 일어나는 간섭(TV 화면의 '가영상' 현상과 유사). 더 긴 경로를 지나온 신호일수록 그로부터 도출되는 추정 의사거리가 커지고 따라서 오차가 증대됩니다. 이 다중 경로 현상은 안테나 주변의 구조물에 의한 반사 때문에 야기되기도 합니다.


Narrow-lane

L1과 L2 반송파 위상 관측치의 선형 결합(L1 + L2)으로서, 수집 기선 데이터에 있는 전리층의 영향을 상쇄하는 데 유용합니다. 실효 파장 10.7 cm


NAVDATA

위성에서 방송하는 1500 비트의 항법 메시지. 이 메시지에는 시스템 시간, 시계 보정 파라미터, 전리층 지연 모델 파라미터, 위성의 궤도력과 상태에 대한 내역 등이 들어 있습니다. 이 정보를 이용하여 GPS 신호를 처리하고 사용자의 위치와 속도를 유도해 냅니다.


망(Network)

기선의 집합. 하위망 참조


망 조정(Network adjustment)

관측치 잔차 가중 제곱의 합을 최소화함으로써 측량 망을 폐합시키는 연립 방정식의 해.

Trimble Geomatics Office 소프트웨어에서 쓰는 이 조정 테크닉은 좌표 변이(Variation of coordinates) 또는 간접 관측법(Method of indirect observations)이라고도 합니다.


망 상태(Network status)

특정 관측치가 조정에 포함될지 여부를 표시하는 것

 망(Network)은 해당 관측치가 조정에 포함됨을 의미

 비망(Non-network)은 해당 관측치가 조정에서 제외됨을 의미


NMEA

National Marine Electronics Association

NMEA 0183 Standard는 해상 전자 항법 장치의 인터페이스에 대한 정의입니다. 이것은 상세한 항법 정보(위치 등)가 들어 있는 여러 '스트링'(NMEA 스트링이라 부름)을 정의합니다.

대부분의 Trimble GPS 수신기는 위치를 NMEA 스트링의 형식으로 출력할 수 있습니다.


법선(Normal)

타원체면과 수직을 이루는 직선


정규 분포 곡선

확률 이론에 의거한 기대값을 바탕으로 하여 확률 변수의 이론적 분포를 그래프화한 것. 히스토그램과 함께 이용


법선면 방위각(Normal section azimuth)

관측자의 측지 자오선에서 타원체의 해당 관측점까지 잰 각도


위거(Northing)
X 좌표(Northing)

북 방향의 그리드 값


관측 잔차(Observation residual)

조정된 결과대로 관측값에 적용하는 보정치


관측치

측량 관측치 참조


선점 시간(Occupation time)

스테이션이나 포인트에서 GPS 기선의 처리에 필요한 시간으로서 측량 테크닉이나 GPS 수신기의 종류, 최종 결과값에 필요한 정밀도 수준 여하에 따라 그 소요 시간이 달라집니다. Kinematic 측량에는 몇 초 정도 걸리고 최고의 정밀도와 반복성(Repeatability)을 요하는 기준점 측량이나 변형 측량(Deformation survey)에는 몇 시간이 걸립니다.


원점(Origin)

좌표계 축의 교점. 시작점


정표고(Orthometric height)

어떤 지점과 지오이드 면 사이의 거리. 흔히 표고라 부릅니다.


OTF 검색법

GPS 기선 처리는, 실시간이나 후처리를 불문하고, 가능한 최상의 결과값을 얻으려면 고정 정수 해가 필요합니다. (정수 검색 참조)

과거에는 2개 이상의 수신기가 각자의 위치에 정지해 있는 상태에서 수집한 측정치를 바탕으로 하여 이 검색을 했습니다. 오늘날의 수신기와 소프트웨어는 로버 수신기가 움직이면서 수집한 측정치도 이용할 수 있습니다. 수신기가 움직인다고 해서 그 데이터를 'On-the fly(OTF)'로 수집한 것이라 하고, 이 데이터를 이용하는 정수 검색을 'OTF 검색'이라 합니다.


이상값(Outlier)

통계 분석의 결과, 추정 오차에 대한 잔차가 너무 큰 것으로 판별된 관측치. Outlier라는 용어는 히스토그램에 표시되는 관측치의 위치에서 유래합니다.


과결정(Over-determined)

망 좌표의 계산에 필요한 수보다 더 많은 측정치가 있는 망. 여유도(Redundancy)와 연관되는 개념


P 코드

GPS 위성에서 송신하는 '정밀(Precise)' 코드. 각 위성은 자신의 고유한 코드가 L1 및 L2 반송파에 변조되어 있습니다. Anti-Spoofing이 실행 중일 때에는 위성에서 P코드 대신 Y 코드가 발신됩니다.


매개 변수(Parameter)

선이나 지형면상의 포인트에 좌표를 부여함에 있어 기준이 되는 독립 변수. 미지수 참조


패리티

2진 디지털 데이터의 저장 및 전송에 쓰는 오류 검사 형식. 오류 검사의 옵션은 '홀수', '짝수', '없음'이 있습니다.


PDOP

Position Dilution of Precision

관측자 위치 오차와 위성 위치 오차 사이의 관계를 나타내는 무단위 수치. 기하학적으로 볼 때, PDOP는 수신기와 4개의 위성을 연결하는 선이 이루는 피라미드의 부피에 반비례합니다. 따라서 위성의 배치 구조가 넓게 펼쳐진 모양일 때 PDOP의 수치는 작아집니다. 측위에 '양호'한 값은 작은 수치(3과 같은)인데 일단 7을 초과하게 되면 불량한 수치로 간주됩니다.

PDOP와 수평 DOP, 수직 DOP와의 관계는 다음 식으로 표시됩니다.


PDOP 차단점(PDOP cutoff)

측위 최대 PDOP 값을 정하는 수신기 파라미터. 위성의 기하 배치 구조가 불량하여 임계값을 초과하는 PDOP가 도출되는 경우에는 수신기가 위치 결정 계산을 중지합니다.


임계 PDOP(PDOP mask)

수신기의 측위 작업이 이루어질 수 있는 PDOP 값의 최고 한계치


페이즈 센터(Phase center)

안테나 페이즈 보정 참조


페이즈 센터 모델(Phase center model)

사용 안테나의 종류에 부합하도록 GPS 신호를 보정하는 모델. 이 보정은 위성의 앙각을 바탕으로 하는데 안테나 페이즈 센터의 위치에서 형성되는 전기적 변이 상황을 모델화합니다. 페이즈 센터 모델은 기지국과 이동국에서 쓰는 안테나가 상이할 때 생기는 오차를 제거합니다. 안테나 페이즈 보정 참조


연직 작업(Plumbing)

측량기나 안테나를 연직선(추선)에 정렬시킴으로써 지구 중력장의 등포텐셜면과 수직이 되게 하는 일


포인트 위치(Point position)

단독 측위 참조


후처리

위성 데이터를 수집한 후, 컴퓨터에서 처리하는 일


PPM

Parts per million

거리 측정에 있어 축척 오차의 표준 단위. 1 PPM 오차는 측정 거리 1,000 m당 1 mm의 오차를 의미합니다.


정밀 궤도력(Precise ephemeris)

위성 궤도력 참조


정밀도(Precision)

확률 변수가 계산값에 얼마나 가까이 밀집하는지 그  경향을 나타내는 척도. 고정밀도는 잔차가 작음을 의미합니다. 일반적인 표시 단위는 One part in 또는Parts per million입니다.


PRN

Pseudorandom noise

마치 잡음처럼 불규칙한 분포같이 보이지만 실제로는 정확히 연속 재생할 수 있는 디지털의 1과 0. PRN 코드는 딱 일치하는 경우가 아니면 모든 지연이나 지체에 대한 자동 상관계수가 작습니다.

NAVSTAR 위성은 각자 자신의 고유한 C/A 및 P 의사 잡음 코드로 식별되기 때문에 'PRN'이라는 용어는 GPS 위성이나 SV의 또 다른 이름으로 이용되는 경우도 있습니다.


확률

관측치의 가설적 갯수 가운데 지정 범위 내에 들어오는 수의 구성 비율을 나타내는 통계적 개념. 유의 수준이라 부르는 경우도 있습니다.


최확값(Probable value)

조정이 올바로 이루어졌다는 가정 하에서 관측치나 기타 수치의 조정 값. 가능한 것 중에서 실제값에 가장 가까운 근사치


프로젝트

Trimble Geomatics Office 소프트웨어는 프로젝트상의 데이터를 바탕으로 실행됩니다. 프로젝트는 사용자의 작업 공간이라 생각할 수 있습니다. 새 프로젝트는 항상 기존 템플리트로부터 만들어지는데 이 때 그 템플리트의 요소가 모두 그대로 옮겨옵니다. 그 다음 단계에서부터 이루어지는 새 작업은 모두 이 프로젝트에만 저장됩니다.

프로젝트에는 원시 관측치, 계산된 포인트, 좌표계 정의, 선 작업, CAD 스타일이 전부 들어갑니다.


프로젝트 데이텀(Project datum)

Trimble Geomatics Office 소프트웨어에서 프로젝트에 지정되는 데이텀. 모든 로컬 좌표는 이 프로젝트 데이텀을 바탕으로 표시됩니다.


투영법(Projection)

지표면의 전부 또는 일부를 평면 지도에 표현하는 방법


전파 오차(Propagated error)

추정 관측 오차에서 비롯된 계산 오차로서 좌표 위치의 형식으로 표현됩니다. 전파된 좌표 오차는 포인트간의 방위각, 거리, 델타고의 상대 오차로 다시 전파될 수 있습니다.


질 수용 테스트(Quality Acceptance test)

GPS 원시 데이터가 사용자가 설정한 허용 편차의 범위를 초과하는지 여부를 결정하고자 소프트웨어 상에서 수행하는 평가 검정. 수준 미달의 데이터는 추가 처리 작업에서 배제하고, 질 제고의 필요성이 있는 데이터는 별도의 표시를 하기도 합니다.


QC 레코드

Quality Control records

QC 레코드에는 GPS 측정 위치에 관한 정보가 들어 있습니다. QC 레코드는 포인트 레코드와 함께 저장됩니다.


비율(Ratio)

초기화 도중, 수신기는 각 위성에 대한 파장 갯수의 정수치를 결정하고, 특정 정수 집합에 대하여 그것이 올바른 집합일 확률을 산출합니다.

비율은 '현재 최적 정수 집합의 정확도 확률'에 대한 '두 번째 최적 집합의 정확도 확률'의 비율을 말합니다. 따라서 이 비율이 높다는 것은 최적 정수 집합이 다른 어떤 정수 집합보다 훨씬 우수하다는 사실을 의미하므로 사용자가 정확성에 대한 확신을 할 수 있게 됩니다. 이 비율은 새 측점 초기화나 OTF 초기화의 경우, 5 이상이어야 합니다.


RDOP

Relative Dilution of Precision


실시간 Kinematic

최소한 4개 위성과의 록(Lock)을 유지하는 상태에서 짧은 (Stop and Go) 선점으로 진행하는 실시간 GPS 측량법. 이 방법은 기지 수신기와 로버 수신기 사이에 데이터의 무선 링크가 필요합니다.


사각형 좌표(Rectangular coordinate)

기준 축이 서로 직각으로 교차하는 좌표계에서의 좌표


Reduced column profile

정규 방정식의 축약 버전으로서 0이 아닌 모든 원소의 저장에 필요한 컴퓨터 메모리를 최소화하기 위하여 방정식들을 재정렬합니다.


여유도(Redundancy)

제어망(Control network)의 과결정 정도, 또는 필요한 관측치보다 많은 정도


여유도 수(Redundancy number)

제어망의 전체가 아니라 일부분에서의 자유도(Degree of freedom) 척도


여유 기선(Redundant baseline)

다른 관측치에 의해 이미 망에 연결된 포인트를 다시 관측하는 기선. 여유 기선은 이전에 한 측정치를 독립적으로 다시 관측하는 것일 수도 있고, 어떤 포인트를 다른 베이스에서 관측하는 것일 수도 있습니다. 포인트의 결정에 있어 과잉 정보가 있다고 해서 '여유'라고 하지만 여유 관측치는 이전 측정치의 질을 점검한다는 면에서 대단히 유용하게 쓰입니다.


여유 관측치(Redundant observation)

반복 관측치, 또는 망을 과결정하게 하는 관측치


기준 계수(Reference factor)

단위 가중치 표준 오차 참조


기준계(Reference frame)

데이텀의 좌표계


기준국(Reference station)

기지국(Base station)을 의미


기준 분산(Reference variance)

기준 계수의 제곱


상대 오차

망조정된 기준점 쌍들의(쌍들 사이의) 오차와 정밀도


잔차(Residual)

제어망에서 전체 폐합을 이루기 위하여 관측치에 적용하는 보정값이나 조정값. 또한 어떤 관측치와, 그 관측치에 대한 계산값과의 차이


RINEX

Receiver INdependent EXchange format

서로 다른 제조업체의 수신기로부터 파일을 주고 받을 경우 이용하는 GPS 원시 데이터의 표준형 파일 포맷


RMS

Root Mean Square(제곱 평균 제곱근)

포인트 측정의 정확도를 나타내는 척도. 이것은 위치 픽스의 약 70%를 포괄하는 오차 원(Error circle)의 반경으로서, 거리 단위나 파장 사이클로서 표현됩니다.


회전 자오선(Rotated meridian)

Oblique Mercator 투영법의 존 상수(Zone constant)


회전(Rotation)

변환에 있어, 좌표 축이 좌표계 원점을 따라 도는 각도


로버(Rover)

현장에서 데이터를 수집 중인 이동 GPS 수신기와 필드 컴퓨터. 움직이는 로버 수신기의 위치는 고정된 베이스 GPS 수신기를 기준으로 차동 보정할 수 있습니다.


RTCM

Radio Technical Commission for Maritime Services

GPS 로버 수신기의 실시간 차동 보정에 대한 차동 데이터 링크를 정의하고자 설립된 위원회. RTCM 차동 보정 메시지는 2가지 종류가 있지만 모든 Trimble GPS 수신기는 보다 최신의 Type 2 RTCM 프로토콜을 이용합니다.


RTK

Real-time kinematic

GPS 측량법의 한 종류


위성 기하(Satellite geometry)

GPS 측량시 GPS 위성들의 위치와 움직임


스칼라(Scalar)

최소 자승법에 있어, 필요한 신뢰도를 바탕으로 분산(오차)에 적용하는 값


스칼라 가중(Scalar weighting)

관측치의 올바른 가중치를 얻고자 추정 오차에 스칼라를 적용하는 과정. Trimble Geomatics Office에서 망 조정시 이용할 수 있는 스칼라는 다음 3가지입니다.

 'Default(기본값)'은 스칼라를 1.00으로 설정함으로써 원래의 추정 오차가 그대로 유지됨을 의미합니다,

 'Alternative(대체)'는 스칼라를 직전 조정의 기준 계수로 설정함을 의미합니다.

 'User-defined(사용자 정의)'는 사용자가 스칼라 값을 입력할 수 있음을 의미합니다.

스칼라를 관측 오차에 적용시 다음 중 하나의 방법을 이용합니다.

 모든 관측치(All Observations)

 각 관측치(Each Observation)

 분산 구성 그룹(Variance Component Groups)


축척(Scale)

투영 및 변환 작업시 좌표나 기타 선형 변수에 쓰이는 승수


SDMS

Survey Data Management System

측량 데이터의 저장에 관한 포맷 정의의 집합. AASHTO에서 이 시스템을 관장합니다.


Selective Availability (S/A)

미 국방부에서 GPS 위성 신호의 정밀도를 의도적으로 떨어뜨리는 조치. 2000년 5월 1일부로 폐지


장반경(Semimajor axis)

장경축의 반


단반경(Semiminor axis)

단경축의 반


세션(Session)

하나 또는 그 이상의 GPS 수신기가 위성 측정 데이터에 로그해 있는 시간


설치 오차(Set-up error)

기준점에서의 기계고 오차나 Tribrach 센터링 오차


사이드샷(Sideshot)

여유도가 없는 관측 기선


시그마(Sigma)

표준 오차를 뜻하는 수학 기호(수학 용어)


1 주파(Single-frequency)

L1 GPS 신호만 이용하는 수신기. 전리층 영향을 보정하지 못합니다.


사이트 캘리브레이션(Site calibration)

WGS-84 좌표(GPS 관측치로 결정하는 위도, 경도, 타원체고)와 이미 알려진 로컬 좌표(투영법과 평균 해수면 표고로써 정의)간의 관계 설정 매개 변수를 계산하는 과정. RTK 측량법의 경우, 이 매개 변수를 이용함으로써 현장에서 실시간으로 WGS-84 좌표에서 로컬 그리드 좌표, 로컬 그리드 좌표에서 WGS-84 좌표를 각각 유도해 냅니다.


하늘 플롯(Skyplot)

일정한 시간 동안의 위성 경로를 나타내는 극 플롯. 위성 앙각은 반경으로 표시되고 방위각은 각도로 표시됩니다. 하늘 플롯은 관측자가 측량점의 바로 위 상공에서 내려다 보는 것처럼 위성의 경로가 그려집니다.


해 유형(Solution type)

GPS 측정치로부터 기선 해를 유도할 때 쓰는 데이터와 테크닉에 대한 설명. 전형적인 해 유형에는 코드(Code), 유동(Float), 고정(Fixed)같은 설명이 포함되는데 이것은 기선 처리기에서 쓰는 기선 해의 도출 테크닉을 기술하는 말입니다. 또한 해 유형에는 L1이나 L2, Wide-lane, Narrow-lane, 전리층 무영향(Ionospheric free) 같은 말이 붙는데 이것은 GPS 측정치를 결합하여 특정 결과를 끌어내는 방식을 설명하는 말입니다. 자세한 사항은 GPS 처리 작업에 관한 참고 자료 참조


사거리(Slope distance)

두 지점 사이의 경사 거리


SNR

신호 대 잡음 비(Signal-to-Noise Ratio)

위성 신호의 강도를 나타내는 척도로서 그 범위는 0(무신호)에서 약 35까지입니다.


표준 오차

오차의 통계적 추정치로서, 무한 갯수의 관측치 중에서 이론상 그 68%가 이 값 이하의 절대 오차를 갖게 됩니다.


단위 가중치 표준 오차(Standard error of unit weight)

조정된 망의 관측 잔차 크기를 나타내는 척도로서, 조정전의 추정 관측 오차와 비교하여 결정


State Plane 좌표

미국의 법정 투영법으로서 Transverse Mercator 및 Lambert Conformal 도법을 특별히 응용한 것입니다. NAD-27에 대한 존 집합과 NAD-83에 대한 존 집합이 각각 있습니다.


Static (측량)

긴 선점(경우에 따라서는 몇 시간)으로 GPS 원시 데이터를 수집한 후, 후처리를 하는 GPS 측량법으로서 센티미터 미만의 정밀도를 보입니다.


Static 망

Static 망은 Static이나 Fast Static 테크닉으로 수집한 GPS 기선을 정리, 처리하는 순서와 그 기하 구조를 설명합니다. 먼저 기선 처리기는 해당 프로젝트를 검토하여 좌표의 질이 최고 등급인 포인트들을 찾아낸 다음, 이것으로부터 처리 망을 구성합니다. 그 결과, 정확한 초기 좌표로써 Static 기선의 집합이 도출됩니다.


상태(Status)

모든 관측치나 키입력된 좌표의 집합은 '상태' 필드(등록 정보 창의 '요약' 페이지에 있음)가 있습니다.

상태 옵션으로는 '이용', '점검점으로 이용', '불이용'의 3가지가 있습니다.

  '이용' 관측치나 좌표는 포인트의 계산 위치를 결정하는 재계산 작업에 항상 이용합니다.

  '점검점으로 이용' 관측치나 좌표는 '이용' 관측치나 좌표가 없을 경우에 이용합니다.

  '불이용' 관측치나 좌표는 절대로 이용하지 않습니다.


확률 모델(Stochastic model)

망 조정에서 오차 추정에 쓰는 기법들을 총체적으로 부르는 말


하위망(Subnetwork)

공통되는 기준점에 의해 서로 연결되고, 다른 기선들과는 분리된(독립적인) 기선의 집합. Trimble Geomatics Office 소프트웨어에서 하나의 망은 1 개 이상의 하위망으로 구성되고, 그 하위망은 최소 하나의 기선과 두 개의 기준점으로 이루어질 수 있습니다.


Super-trak

P 코드가 암호화되어 있을 때의 L2 신호 처리법으로서 Trimble의 전유 방법


측량 관측치

GPS 수신기 또는 광파기 등의 측량 장비로써 기준점에서나 기준점 사이에서 한 측정치


SV

위성 운반체(Satellite Vehicle) 또는 우주 운반체(Space Vehicle)


심벌 및 선 형식

심벌 및 선 형식은 Trimble Symbol Editor 및 Trimble Line Type Editor 유틸리티로써 관리합니다. 이것을 이용하여 기존의 심벌 및 선 형식을 수정함은 물론, 새로 만들기도 합니다. 심벌은 심벌 라이브러리에, 선 형식은 선 형식 라이브러리에 각각 저장됩니다.

Trimble Geomatics Office 소프트웨어는 현재 설정되어 있는 시스템 라이브러리를 이용하게 되는데, 어떤 라이브러리를 수정한 후 저장할 때 이것을 시스템 라이브러리로 변경, 지정할 수 있습니다(이 라이브러리가 현행 시스템 라이브러리가 아닌 경우).


정오차(Systematic error)

연관된 여러 관측치에서 동일한 부호로 발생하는 오차로서 그 크기도 같을 경우가 있습니다.


Tau (값)

관측치 수, 자유도, 주어진 유의 수준(95%)을 토대로 하여 내부 도수 분포로부터 계산한 값. 이 값은 망 조정에서 어떤 관측치가 다른 관측치들과 어울리는지 여부를 결정하는 데 쓰입니다. Tau를 초과하는 관측치는 이상값(outlier)의 플래그가 붙습니다. 표준 잔차 히스토그램에서는 Tau 선(중앙 연직선 좌우의 연직선)으로 알려져 있습니다.


Tau 기준(Tau criterion)

관측치 이상값(Outlier)을 찾아내는Allen Pope의 통계 테크닉. 자세한 내용은 Pope (1976) 참조.


TDOP

Time Dilution of Precision


비GPS 관측(Terrestrial observation)

레이저 거리계나 광파 측량기로써 하는 현장 관측


TOW

Time of Week

토요일 자정(토요일에서 일요일로 넘어가는)을 기점으로 하는 초 단위의 GPS 시간


추적 중(Tracking)

위성으로부터의 신호를 인식하고 수신하는 과정


변환(Transformation)

어떤 망을 회전, 이동(Shift), 비율 조정함으로써 이를 한 좌표계에서 다른 좌표계로 옮기는 것


변환 그룹(Transformation group)

변환 매개 변수(해당 관측치 그룹에 고유한)의 계산에 이용하는, 선택된 관측치 그룹. 일반적으로 변환 그룹내의 관측치들은 동일한 종류이고 오차가 비슷하며 측정 방법이 같습니다.


변환 매개 변수(Transformation parameter)

망 조정에 쓰고자 유도해 내거나 사용자가 정의한 매개 변수 집합으로서 한 데이텀을 다른 데이텀으로 변환합니다. 대체로 GPS에서는 WGS-84로부터 로컬 데이텀으로 변환하는 매개 변수를 만듭니다.


Tribrach

GPS 안테나나 기타 측량기기를 측량 삼각대에 탑재할 때 쓰는 센터링 장치


Tribrach 센터링 오차(Tribrach centering error)

관측점에서 Tribrach의 센터링(연직 작업)에 관련된 추정 오차. 이 추정치는 측량법의 질(Quality) 조사를 바탕으로 하며, 보수적으로 설정되어야 합니다.


대류권 보정(Tropo Correction)

Tropospheric correction

위성 측정치의 대류권 지연에 대하여 적용하는 보정


대류권 모델(Tropo model)

Tropospheric model

GPS 신호는 대류권에 의해 지연이 됩니다. 지연량은 온도와 습도, 기압, 스테이션의 해수면 타원체고, GPS 위성의 앙각 등의 요인에 따라 달라집니다. 대류권 모델 (대류권 지연을 설명하는 모델)을 이용하면 코드 및 위상 측정치에 대한 보정을 할 수 있습니다.


단변량(Univariate)

아래 항목에서 1차원 우연 오차(Random error)의 성격을 설명하는 수학 함수

  각도

  거리

  타원체고차

  표고

  타원체고


URA

사용자 거리 정확도(User Range Accuracy)

어떤 특정 위성 운반체(SV)를 이용하는 경우, 그 위성 자체의 문제나 Selective Availability(S/A)로 인해 유발될 수 있는 오차의 척도. 32 m의 URA는 S/A가 발효 중임을 의미합니다. URA의 값은 관제 부문(Control Segment)이 설정하고 위성이 방송하게 됩니다.


미지수(Unknown)

좌표 및 변환 매개 변수에 적용하는 계산 조정치. 관측 잔차의 계산에도 이용


US National

미국 영토내의 모든 측지 측량 기준망과 국가 측지 데이텀을 관리하는 정부 기관


US Survey Foot

1200/3937 미터. NAD-27에 대한 선형 척도의 공식 단위


UTC

협정 세계시(Universal Time Coordinated)

그리니치 자오선에서의 현지 평균 태양시에 바탕을 둔 시간 기준. GPS 시간 참조


분산(Variance)

표준 오차의 제곱


분산 구성 추정(Variance component estimation)

어떤 망에서 다른 부분의 상대 오차를 추정하는 최소 자승 기법


분산 그룹(Variance group)

망 조정에서 분산 구성 추정을 적용 중인 관측치 그룹 중 하나


분산-공분산 행렬(Variance-covariance matrix)

관측치 그룹의 분산과 공분산을 표현하는 숫자의 집합


VDOP

Vertical Dilution of Precision


벡터(Vector)

두 포인트간의 3차원 선


연직선(Vertical)

타원체 대신 지오이드의 접평면으로부터 계산한다는 점을 제외하고는 법선(Normal)과 유사


수직 조정(Vertical adjustment)

수직 관측치와 수직 좌표만의 망 조정


수직 기준점(Vertical control point)

수직 좌표의 정확도만 있는 포인트. 수평 좌표의 정확도는 낮은 순위이거나 알 수 없습니다.


WAVE

Weighted Ambiguity Vector Estimator

Trimble 기선 처리기. Static이나 FastStatic, Kinematic 방법으로 수집한 현장 관측 자료로부터 GPS 벡터를 계산합니다.


가중치(Weight)

관측치 분산의 역


가중 전략(Weighting strategy)

Trimble Geomatics Office 소프트웨어에서 분산-공분산 행렬의 확대(Augment)에 이용하는 값의 수집


가중치 집합(Weights)

가중치의 집합. 또는 서로 상관 관계가 있는 관측치의 분산-공분산 행렬의 역


WGS-84

World Geodetic System (1984)

세계 측지계로서1987년 1월 이후부터 GPS에서 이용하는 수학적 타원체


Wide-lane

L1과 L2 반송파 위상 관측치의 선형 결합(L1 − L2). 낮은 실효 파장(86.2 cm)에 유용하며 긴 기선의 정수 모호성을 찾아내는 데 쓰입니다.


X, Y, Z 축

지구 중심 Cartesian 좌표계에서 X 축은 좌표계 원점으로부터 그리니치 자오선까지의 축, Y 축은 동경 90� 자오선까지의 축, Z 축은 북극점까지의 축을 각각 말합니다. 사각형 좌표계에서는 X 축은 동서 방향 축, Y 축은 남북 방향 축, Z 축은 높이 축을 이릅니다.


Y 코드

Y 코드는 P 코드에 들어있는 정보가 암호화된 형태입니다. Anti-Spoofing이 실행 중일 때에는 위성에서 P코드 대신 Y 코드가 발신됩니다.


천정 지연(Zenith delay)

바로 머리 위 상공에 있는 위성으로부터 나오는 GPS 신호의 대류권 지연. 위성이 지평선으로 다가감에 따라 신호의 대류권 통과 경로가 길어지고, 따라서 전파 지연이 증가하게 됩니다.


GPS 정밀 궤도력 파일

정밀 궤도력 파일에는 특정 기간 동안(일반적으로 하루)의 각 위성에 대한 정확한 위치 데이터와 시계 보정치가 들어 있습니다. 기선 처리기는 이 정보를 이용하여 방송 위성력의 오차를 감소시킴으로써 기선의 정확도를 제고합니다. 또한 정밀 궤도력을 이용하면 기선 처리기가 긴 기선에서 고정해를 유도해내는 데 도움이 됩니다.

Trimble Geomatics Office는 2가지 파일 포맷의 정밀 궤도력을 지원합니다.

  .sp3 − U.S. National Geodetic Survey에서 정의한 ASCII 포맷으로서, 가장 널리 쓰이는 포맷

  .ef18 −.sp3 파일의 정보와 비슷한 정보가 있는 2진 파일로서, 디스크 공간이 덜 들면서도 기선 처리기에서 더 효과적으로 쓸 수 있습니다.

정밀 궤도력의 사용은 활성 GPS 기선 처리 스타일 대화 상자의 '위성 궤도력' 옵션으로 제어합니다. 정밀 궤도력 파일은 반드시 각 프로젝트로 가져와서 사용하여야 하는데, [파일 / 가져오기] 명령을 실행하여 프로젝트에 로드합니다.

원래 정밀 궤도력 파일은 1 주일 동안의 위성 위치와 시계 옵셋 정보를 제공하였지만, 현재는 단 1일간의 정보를 제공할 뿐입니다. 이는 정밀 궤도력 파일이 이보다 더 짧은 기간으로도 될 수 있다는 것을 의미합니다.

정밀 궤도력의 시간 범위는 데이터의 시작 전과 후 모두, 최소 8개의 위성 에포크로 처리 중인 GPS 측정치의 그것보다 커야 기선 처리기에서 이용할 수 있습니다. 추가적으로 이용하는 이 정밀 궤도력 정보는 측량의 시작과 끝에서 올바른 보간 작업을 함에 필요합니다.

정밀 궤도력 가져오기 유틸리티는,

  해당 파일의 포맷을 검사합니다. 이 파일이 .sp3 포맷이면 가져오기 과정에서 .ef18 포맷으로 자동 변환하고, .ef18 포맷이면 그대로 이용합니다.

  기존의 정밀 궤도력 파일이 해당 프로젝트에 이미 로드되어 있는지 확인합니다. 로드되어 있는 경우에는 그 파일의 시간 범위를 검토하여 새 파일의 시간 범위와 동일한지 여부를 결정합니다. 동일하다면, 새 파일이 기존 파일을 덮어쓰게 되고 가져오기 보고서에 경고 메시지가 나와 이 사실을 표시합니다.

  해당 파일을 프로젝트의 정밀 궤도력 폴더로 복사합니다.

정밀 궤도력 파일은 다음과 같이 여러 기관으로부터 나옵니다.

  U.S. National Geodetic Survey

  Center for Orbit Determination in Europe (CODE)

  European Space Agency

  Scripps Orbit and Permanent Array Center (SOPAC)

  Canadian Department of Energy, Mines and Resources (EMR)

  NASA Jet Propulsion Laboratory (JPL)


정밀 궤도력 파일 가져오기
정밀 궤도력 파일(.sp3, .e18)을 사용자의 시스템에 가져오기

1.	[파일 / 가져오기] 명령을 실행합니다. [가져오기] 대화 상자가 나옵니다.

2.	[측량] 탭 하에서 '정밀 궤도력 파일 (*.sp3, *.e18)' 옵션을 선택합니다.

3.	[확인] 단추를 누릅니다. [열기] 대화 상자가 나옵니다.

4.	가져오고자 하는 .sp3나 .e18 파일을 선택합니다.

5.	[열기] 단추를 누릅니다.

해당 파일이 프로젝트의 정밀 궤도력 폴더로 로드됩니다.

참조: 가져오는 정밀 궤도력 파일의 시간 범위(Time span)가 프로젝트의 기존 정밀 궤도력 파일의 그것과 동일할 경우, 메시지가 나옵니다. 이 메시지는 가져오기 도중 하나 이상의 메시지가 발생하였다는 사실을 표시합니다. 이 파일의 내역을 보려면 이 메시지에서 [예] 단추를 누릅니다.

참조: 정밀 궤도력의 사용은 활성 GPS 기선 처리 스타일 대화 상자의 '위성 궤도력' 옵션으로 제어합니다.


등록 개요

Trimble Geomatics Office 소프트웨어를 등록하고 연락처 내역을 알려 주시면 본 소프트웨어에 대한 신정보(제품 신개발 정보 등)가 생기는 즉시 이를 보내 드리도록 하겠습니다. 사용자 등록은 지속적인 제품 개발과 고객 지원 체제의 강화에 큰 도움이 됩니다.

제품 등록은 Trimble Geomatics Office 설치 작업의 마지막 단계에서 할 수도 있고, 이 소프트웨어를 실제로 사용하는 도중 아무 때나 할 수도 있습니다.

등록 방법:

1.	Trimble Geomatics Office에서 [도움말 / 등록] 명령을 실행합니다.

2.	원하는 등록 방법을 선택합니다.

 인터넷으로 등록 신청서를 작성, 제출합니다.

 소정의 등록 신청서를 인쇄하여 작성한 후, 팩스나 우편으로 보냅니다.

어느 방법이든 그 등록 기재 사항은 동일합니다.

등록 신청서 상의 정보는 당사 외부로 유출되거나 다른 용도에 쓰이지 않습니다. 등록 신청서에는 Trimble Geomatics Office의 구입 동기나 사용 목적에 대한 문항도 있습니다. 이들은 응답을 하지 않으셔도 무방하지만, 이 모든 정보가 보다 나은 제품 개발과 고객 지원 체제의 강화에 소중한 밑거름이 됨을 거듭 말씀 드리고자 합니다.


등록 - 인터넷으로
등록 − 인터넷으로

 개요 및 추가 정보

Trimble Geomatics Office 소프트웨어를 인터넷으로 등록하려면

1.	[도움말 / 등록 / 인터넷으로] 명령을 실행합니다. 온라인 등록 페이지가 사용자의 웹 브라우저에 나옵니다.

2.	이 양식을 작성하되, * 마크가 있는 난은 모두 그 내역을 기재하도록 합니다.

3.	[Send Registration Now(지금 등록서 보내기)]를 누릅니다.


등록 - 팩스나 우편으로
등록 − 팩스나 우편으로

 개요 및 추가 정보

Trimble Geomatics Office 소프트웨어를 팩스나 우편으로 등록하려면

1.	[도움말 / 등록 / 팩스나 우편으로] 명령을 실행합니다. Trimble Geomatics Office 등록 신청서가 사용자의 기본 텍스트 편집기에 나옵니다.

2.	이 신청서를 작성하되, * 마크가 되어 있는 난은 모두 그 내역을 기재하도록 합니다.

3.	작성을 끝내고 저장합니다.

4. 	다음 주소로 보냅니다.

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

USA

Attention: Technical Publications Group

팩스: +1 720 887-6101


GPS 루프 폐합 보고서 - 개요
    GPS 루프 폐합 보고서 − 개요

추가 정보

방법 ...	보고서	기타
개요

GPS 루프 폐합 보고서는 어떤 망에 있는 GPS 관측치 집합의 질을 판단함에 도움이 됩니다. 이 보고서는 기선 처리 결과(Baseline Processing 모듈이 설치된 경우)의 오차 검사에 이용할 수 있습니다. 하지만 루프 폐합을 만들기 위해서는 사용자가 기하학적 폐합 형태의 망을 구성하였을 것입니다. 따라서 Trimble Geomatics Office는 가능한 모든 루프를 자동으로 만들고 GPS 루프 폐합 보고서를 산출합니다.

[루프 폐합 설정] 대화 상자는 루프를 구성하고 분석하는 방식의 설정에 이용합니다. 또한 GPS 루프 폐합 보고서에 표시되는 정보의 양을 결정하는 용도로도 쓰입니다. 루프 폐합 설정은 [보고서 / 설정 / GPS 루프 폐합 보고서]로써 액세스합니다.

GPS 루프 폐합 보고서에 기본값으로 포함되는 섹션은 다음과 같습니다.

  헤더

  요약

  불합격 루프

  불합격 루프상의 관측치

  불합격 루프상의 선점

다음의 섹션들은 [루프 폐합 설정] 대화 상자에서 별도로 선택을 하면 보고서에 포함할 수 있습니다.

  불합격 루프 내역

  합격 루프

  합격 루프 내역

참고할 지침:

  폐합차가 작아야 바람직합니다. 큰 폐합차는 루프상에서 하나 이상의 관측치에 문제가 있음을 의미합니다.

  큰 폐합차는 현장에서의 실수(예: 안테나 정보를 잘못 입력하거나 스테이션을 잘못 설정) 때문일 경우가 많습니다. 다수의 불합격 루프에 공통적으로 소속되어 플래그가 붙은 관측치는 필드 노트를 검토함으로써 그 관련 정보를 확인하도록 합니다.

  기하학적 폐합 형태들로 이루어지는 망을 구성할 때, 각 형태에 있어 상이한 세션으로부터의 기선을 포함하는 방식으로 망을 관측하도록 합니다. 만일 루프의 모든 기선이 동일 세션에서 관측한 것이라면 스테이션 설정 공통 오차를 찾아내지 못하게 됩니다.

참조:루프 폐합 보고서로부터 '측량 보기' 모드의 GPS 루프에 링크할 수 있습니다.


GPS 루프 폐합 보고서 - 헤더
    GPS 루프 폐합 보고서 − 헤더

추가 정보

방법...	보고서	기타
모든 보고서에는 보고서 헤더가 있습니다. 이 보고서 헤더에는 프로젝트 일반 정보의 요약과 [내용] 섹션이 나옵니다. [내용] 섹션에는 하이퍼링크가 있어 각 보고서 섹션으로 곧장 이동할 수 있습니다.

필드:

프로젝트

프로젝트 이름이 표시됩니다.

사용자 이름

프로젝트 등록 정보에 입력된 이름이 나옵니다.

날짜와 시간

보고서를 만든 날짜와 시간이 표시됩니다.

좌표계

프로젝트 등록 정보에서 선택된 좌표계가 표시됩니다.

존

프로젝트 등록 정보에서 선택된 좌표계 존이 표시됩니다. GPS 캘리브레이션 사이트가 선택된 경우에는 그 사이트 이름이 [존] 필드에 나옵니다.

모든 공표된 좌표계는 존이 있습니다. 유일한 예외는 기본 투영법의 경우로서, [존] 필드에 '기본값'이 표시됩니다. 이 기본값은 N = 10000, E = 10000, 표고 = 100와 같이 사이트의 좌표를 가정할 때 이용합니다.

프로젝트 데이텀

프로젝트 등록 정보에서 선택된 프로젝트 데이텀이 표시됩니다. 이것은 조정용으로 선택한 데이텀을 의미하지 않습니다.

수직 데이텀

이 필드를 망 조정 보고서 헤더 정보에 추가할 수 있습니다. 필요한 내역을 [프로젝트 등록 정보] 대화 상자 / [프로젝트 내역] 탭 하의 [수직 데이텀] 필드에 추가하면 됩니다.

지오이드 모델

지오이드 모델 이 프로젝트 등록 정보에 지정되어 있는 경우에는 이 필드에 나옵니다. 프로젝트에 지정된 모델이 없다면 '선택되지 않았음'이라고 표시됩니다.

좌표 단위

프로젝트 등록 정보에서 선택된 좌표계 의 단위를 표시합니다.

거리 단위

프로젝트 등록 정보에서 선택된 거리 단위를 표시합니다.

높이 단위

프로젝트 등록 정보에서 선택된 높이 단위를 표시합니다.

내용

GPS 루프 폐합 보고서의 수록 내용은 [루프 폐합 설정] 대화 상자에서의 설정 내용에 따라 달라집니다. GPS 루프 폐합 보고서에 기본값으로 수록되는 섹션은 다음과 같습니다.

  헤더

  요약

  불합격 루프

  불합격 루프상의 관측치

  불합격 루프상의 선점

다음의 섹션들은 [루프 폐합 설정] 대화 상자에서 별도로 선택을 하면 보고서에 포함할 수 있습니다.

  불합격 루프 내역

  합격 루프

  합격 루프 내역


GPS 루프 폐합 보고서 - 요약
    GPS 루프 폐합 보고서 − 요약

추가 정보

방법 ...	보고서	기타
이 섹션은 루프 폐합 분석의 결과를 간략히 표시하는 난으로서, 다음과 같은 정보가 나옵니다.

루프의 레그 수

루프의 변(side)을 형성하는 관측치의 수를 표시합니다. 기본값은 3입니다. 지정한 레그(leg)의 수가 3보다 큰 경우, 레그가 이 갯수 이하인 루프는 전부 만들어지게 됩니다. 다시 말해, 만일 5가 명시되었다면 변이 5개나 4개, 3개인 루프는 모두 이 보고서의 고려 대상이 됩니다.

루프의 수

만들어진 루프의 총 갯수

합격한 수

허용 기준을 충족하는 루프의 수

불합격한 수

허용 기준을 충족하지 못하는 루프의 수

합격/불합격 기준

수평 및 수직 절대 허용 편차 값

최선

만들어진 루프 중 가장 양호한 것의 결과치

최악

만들어진 루프 중 가장 불량한 것의 결과치

평균 루프

만들어진 전체 루프의 평균 결과치

표준 편차

만들어진 전체 루프의 표준 편차


GPS 루프 폐합 보고서 - 불합격 루프
    GPS 루프 폐합 보고서 − 불합격 루프

추가 정보

방법 ...	보고서	기타
이 섹션에는 폐합차의 허용 범위를 벗어난 각 루프의 정보가 표시됩니다. 어떤 루프의 폐합차가 [GPS 루프 폐합 설정] 대화 상자에서 명시한 허용 범위를 초과하면 불합격으로 분류됩니다. 이 섹션은 기본 보고서에 포함됩니다.

다음은 어떤 불합격 루프에 대한 예제 보고서 섹션입니다.

GPS 루프 1:
MOON 2:WAVE:N 245:MOON 2

관측치:

		시점	종점	해 유형	시작 시간
B3	S1	MOON 2	WAVE	L1 고정	13:45:03 24 Feb 1999
B47	S5	MOON 2	WAVE	L1 고정	13:11:03 24 Feb 1999
B2	S8	WAVE	N 245	L1 고정	13:45:03 24 Feb 1999
B46	S4	MOON 2	N 245	L1 고정	13:43:48 24 Feb 1999
B49	S7	MOON 2	N 245	L1 고정	12:28:33 24 Feb 1999

불합격 결합; 루프 1:

	길이	델타 수평	델타 수직	Ppm
S5 � S8 � S7	3295.499m	0.026m	0.034m	12.915
관측치 테이블

테이블의 처음 두 열은 루프에서 이용한 관측치의 기선 ID와 해 ID를 각각 뜻합니다. 기선 ID는 중첩되는 두 세트의 GPS 데이터(처리되어 기선을 형성)의 결합입니다. 해 ID는 기선 처리기에 의한 기선의 실제 해를 나타냅니다. GPS 처리 결과의 저장시 [중복 기선해 덮어쓰기] 확인란이 선택 해제되어 있을 경우에는 단일 기선 ID에 복수의 해 ID가 있을 수 있습니다

테이블의 기타 열:

시점

관측치의 시작점

종점

관측치의 종점

해 유형

관측치의 해 유형

시작 시간

관측의 시작 시간

'루프 #의 불합격 결합' 테이블

이 테이블은 어떤 GPS 관측치의 결합이 폐합차 허용 기준치를 초과하는지 보여줍니다. 상기 예시의 경우에서는 단일 결합이지만, 만일 여러 개가 불합격한다면 이 테이블에 다중 결합이 나열됩니다. 이 테이블의 첫째 열은 불합격한 결합에서의 기선 해를 나타냅니다.

참조: 불합격 결합을 클릭하면 '측량 보기' 모드에서 그 관측치가 하이라이트 됩니다.

기타 열:

길이

루프의 총 둘레 거리

델타 수평

이 루프의 수평 폐합차

델타 수직

이 루프의 수직 폐합차

Ppm

백만분율로 표시한 수평 및 수직 폐합차의 총계


GPS 루프 폐합 보고서 - 불합격 루프상의 관측치
    GPS 루프 폐합 보고서 − 불합격 루프상의 관측치

추가 정보

방법 ...	보고서	기타
이 섹션은 불합격 루프를 모두 점검하고 다중 불합격 루프에 있는 기선을 보고하므로 그 망에 어울리지 않는 GPS 기선을 식별하는 데 도움이 됩니다. 불합격의 정도가 가장 심한 루프의 기선이 목록의 제일 위에 나오고, 또한 기선의 요약 통계가 있어 손쉽게 불량 해를 식별할 수 있습니다.

이 섹션은 기본 보고서에 포함됩니다.

다음은 예제 보고서 섹션입니다.

		시점	종점	해 유형	비율	기준 분산	RMS	발생 #
B2	S8	WAVE	N 245	L1 고정	21.8	2.489	0.006	3
B47	S5	MOON 2	WAVE	L1 고정	2.9	1.693	0.005	2
B5	S19	COWBOY	KTOM	L1 고정	8.5	1.117	0.009	1

제일 위로

테이블의 처음 두 열은 다중 불합격 루프에 소속된 GPS 관측치의 기선 ID와 해 ID를 각각 뜻합니다. 기선 ID는 중첩되는 두 세트의 GPS 데이터(처리되어 기선을 형성)의 결합입니다. 해 ID는 기선 처리기에 의한 기선의 실제 해를 나타냅니다. GPS 처리 결과의 저장시 [중복 기선해 덮어쓰기] 확인란이 선택 해제되어 있을 경우에는 단일 기선 ID에 복수의 해 ID가 있을 수 있습니다

기타 열:

시점

관측치의 시작점

종점

관측치의 종점

시작 시간

GPS 관측의 시간과 날짜

비율

기선 처리기에서 결정된 GPS 관측치 비율

기준 분산

기선 처리기에서 결정된 GPS 관측치 기준 분산

RMS

기선 처리기에서 결정된 GPS 관측치 RMS

발생 #

해당 GPS 관측치가 속해 있는 불합격 루프의 수. 이 숫자가 큰 관측치는 해당 망에 어울리는지 재검토해 볼 필요가 있습니다.


GPS 루프 폐합 보고서 - 불합격 루프상의 선점
    GPS 루프 폐합 보고서 − 불합격 루프상의 선점

추가 정보

방법 ...	보고서	기타
이 섹션은 불합격 루프를 모두 점검하여 다중 불합격 루프에 있는 기선을 결정한 후, 이 기선에 공통되는 선점을 보고하므로 해당 망에 어울리지 않는 기선의 GPS 스테이션 선점을 식별하는 데 도움이 됩니다. 이 스테이션 선점은 스테이션 설치 오차가 있을 수 있습니다. 이 목록은 불합격의 정도가 가장 심한 루프에서 발생하는 선점이 제일 위에 나오게 정렬됩니다.

이 섹션은 기본 보고서에 포함됩니다.

다음은 예제 보고서 섹션입니다.

불합격 루프상의 선점

포인트	시작 시간	발생 #
KTOM	10:46:18 24 Feb 1999	6
WAVE	13:11:03 24 Feb 1999	5
MOON2	12:04:48 24 Feb 1999	4
COWBOY	14:05:03 24 Feb 1999	3
N 245	12:28:33 24 Feb 1999	2
COWBOY	12:45:48 24 Feb 1999	1
제일 위로

이 섹션의 열:

포인트

선점이 이루어진 포인트의 이름

시작 시간

선점의 시간. 이 시간을 이용하여 필드 노트를 프로젝트의 정보와 비교, 확인합니다.

발생 #

불합격 루프에 속하는 관측치에 이 선점이 쓰이는 횟수. 이 숫자가 큰 선점은 스테이션 설치 오차를 방지하기 위하여 재검토해 볼 필요가 있습니다.


GPS 루프 폐합 보고서 - 불합격 루프 내역
    GPS 루프 폐합 보고서 − 불합격 루프 내역

추가 정보

방법 ...	보고서	기타
이 섹션에는 폐합차 허용 범위를 초과하는 각 루프의 정보가 보다 자세히 나옵니다. 이 섹션은 기본 보고서에 포함되지 않지만 [루프 폐합 설정] 대화 상자에서 별도로 선택하면 포함할 수 있습니다 .

다음은 예제 보고서 섹션입니다.

불합격 루프 내역

루프 S1 - S86 - S3:

시점:	MOON 2
종점:	WAVE		L1 고정	13:45:02 24 Feb 1999
		경사:	962.407m	606819.055m
		총계:	962.407m	1828548.125m
				29.499m
종점:	N 245		L1 유동	13:45:02 24 Feb 1999
		경사:	852.542m	606662.061m
		총계:	1814.949m	1829386.030m
				33.251m
종점:	MOON 2		L1 고정	13:43:47 24 Feb 1999
		경사:	1480.504m	605983.905m
		총계:	3295.453m	1828070.086m
				26.770m
정밀도:		32.407ppm
오차	수평:	0.096m	수직:	-0.046m

테이블의 상단에는 이 루프를 구성하는 기선 해의 목록이 있습니다. 그 다음에는 루프의 시점이 나옵니다.

뒤 이어 서너 개의 하위 섹션이 나오는데, 이들은 각 4개의 행으로 구성되며 스테이션 정보를 포함합니다. 하위 섹션은 프로그램이 이 루프를 트래버스하는 순서대로 나옵니다. 각 하위 섹션에서의 첫 행은 '종점:' 식별자로 시작합니다.

행 1

이 행은 GPS 관측치의 정보를 표시합니다. '종점:' 식별자 다음에는 루프를 트래버스하는 순서대로 포인트 이름이 나오고, GPS 관측치의 종류와 수집일이 뒤따릅니다.

이 행의 정보는 테이블 상단에 있는 해 ID 중 하나와 일치합니다. 특정 기선 해에 대한 보다 자세한 정보는 '측량 보기' 모드의 등록 정보 창에서 그 통계를 살펴보거나, 또는 해당 기선에 대한 GPS 기선 처리 보고서를 만드는 방식으로 얻을 수 있습니다.

행 2

두번째 행은 '경사' 식별자가 나오고, 그 다음에 GPS 관측치의 사거리, 현행 종점 좌표의 X 좌표가 순서대로 뒤따릅니다.

행 3

세번째 행은 '총계' 식별자가 나오고, 그 다음에 지금까지 루프를 구성한 총 트래버스 거리, 현행 종점 좌표의 Y 좌표가 순서대로 뒤따릅니다.

행 4

마지막 행은 식별자가 없습니다. 현행 종점 좌표의 타원체고가 표시됩니다.

참조: 이 보고서의 X 좌표/Y 좌표/타원체고 좌표는 해당 프로젝트에서의 좌표와 동일하지 않습니다. 여기에 표시되는 값은 GPS 관측치를 처음의 시점 좌표에 더하고, 해당 루프를 따라 이 벡터 합산 과정을 계속함으로써 도출하는 좌표입니다. 루프의 끝에 도달하게 되면, 이 방식으로 도출한 좌표를 시점의 원래 좌표와 비교하여 폐합차를 계산합니다.

이 테이블의 마지막 하위 섹션은 시점에 대한 것으로서, 루프가 폐합되었다는 사실을 나타냅니다. 이 두 행은 루프 폐합차에 관한 정보입니다.

정밀도

백만분율로 표시한 수평 및 수직 폐합차의 총계

오차

이 루프에서의 수평 및 수직 폐합차


GPS 루프 폐합 보고서 - 합격 루프
    GPS 루프 폐합 보고서 − 합격 루프

추가 정보

방법 ...	보고서	기타
이 섹션에는 폐합차 허용 기준을 충족하는 각 루프의 정보가 나옵니다. 루프는 그 폐합차가 설정 허용 편차와 같거나 작으면 합격으로 분류됩니다. 이 섹션은 기본 보고서에 포함되지 않지만 [루프 폐합 설정] 대화 상자에서 별도로 선택하면 포함할 수 있습니다 .

다음은 예제 보고서 섹션입니다.

합격 루프

GPS 루프 1:
MOON 2: WAVE: COWBOY: MOON 2

관측치:

기선 ID	해 ID	시점	종점	해 유형	시작 시간
B3	S1	MOON 2	WAVE	L1 고정	13:45:02 24 Feb 1999
B47	S4	MOON 2	WAVE	L1 고정	13:11:02 24 Feb 1999
B1	S9	WAVE	COWBOY	L1 고정	14:05:02 24 Feb 1999
B45	S2	MOON 2	COWBOY	L1 고정	14:05:02 24 Feb 1999
B48	S5	MOON 2	COWBOY	L1 고정	12:45:47 24 Feb 1999
합격 결합; 루프 1:

	길이	델타 수평	델타 수직	Ppm
S1 - S9 - S2	3795.569m	0.001m	-0.002m	0.508
S1 - S9 - S5	3795.577m	0.009m	0.001m	2.296
S4 - S9 - S2	3795.568m	0.018m	-0.012m	5.683
S4 - S9 - S5	3795.577m	0.020m	-0.009m	5.872
관측치 테이블

테이블의 처음 두 열은 루프에서 이용한 GPS 관측치의 기선 ID와 해 ID를 각각 뜻합니다. 기선 ID는 중첩되는 두 세트의 GPS 데이터(처리되어 기선을 형성)의 결합입니다. 해 ID는 기선 처리기에 의한 기선의 실제 해를 나타냅니다. GPS 처리 결과의 저장시 [중복 기선해 덮어쓰기] 확인란이 선택 해제되어 있을 경우에는 단일 기선 ID에 복수의 해 ID가 있을 수 있습니다

테이블의 기타 열:

시점

관측치의 시작점

종점

관측치의 종점

해 유형

관측치의 해 유형

시작 시간

관측의 시작 시간

'루프 #의 합격 결합' 테이블

이 테이블은 어떤 GPS 관측치의 결합이 폐합차 허용 기준치 이하인지 보여줍니다. 이 테이블의 첫째 열은 합격한 결합에서의 기선 해를 나타냅니다.

참조: 합격 결합을 클릭하면 '측량 보기' 모드에서 그 관측치가 하이라이트 됩니다.

기타 열:

길이

루프의 총 둘레 거리

델타 수평

이 루프의 수평 폐합차

델타 수직

이 루프의 수직 폐합차

Ppm

백만분율로 표시한 수평 및 수직 폐합차의 총계


GPS 루프 폐합 보고서 - 합격 루프 내역
    GPS 루프 폐합 보고서 − 합격 루프 내역

추가 정보

방법 ...	보고서	기타
이 섹션에는 폐합차 허용 범위를 충족하는 각 루프의 정보가 보다 자세히 나옵니다. 이 섹션은 기본 보고서에 포함되지 않지만 [루프 폐합 설정] 대화 상자에서 별도로 선택하면 포함할 수 있습니다 .

다음은 예제 보고서 섹션입니다.

합격 루프 내역

루프 S1 - S9 - S2:

시점:	MOON 2
종점:	WAVE		L1 고정	13:45:02 24 Feb 1999
		경사:	962.407m	606819.055m
		총계:	962.407m	1828548.125m
				29.499m
종점:	COWBOY		L1 고정	14:05:02 24 Feb 1999
		경사:	1076.569m	607738.388m
		총계:	2038.976m	1827988.084m
				22.331m
종점:	MOON 2		L1 고정	14:05:02 24 Feb 1999
		경사:	1756.593m	605983.815m
		총계:	3795.569m	1828070.120m
				26.815m
정밀도:	0.50858508651573ppm
오차	수평:	0.001m	수직:	�0.002m

테이블의 상단에는 이 루프를 구성하는 기선 해의 목록이 있습니다. 그 다음에는 루프의 시점이 나옵니다.

뒤 이어 서너 개의 하위 섹션이 나오는데, 이들은 각 4개의 행으로 구성되며 스테이션 정보를 포함합니다. 하위 섹션은 프로그램이 이 루프를 트래버스하는 순서대로 나옵니다. 각 하위 섹션에서의 첫 행은 '종점:' 식별자로 시작합니다.

행 1

이 행은 GPS 관측치의 정보를 표시합니다. '종점:' 식별자 다음에는 루프를 트래버스하는 순서대로 포인트 이름이 나오고, GPS 관측치의 종류와 수집일이 뒤따릅니다.

이 행의 정보는 테이블 상단에 있는 해 ID 중 하나와 일치합니다. 특정 기선 해에 대한 보다 자세한 정보는 '측량 보기' 모드의 등록 정보 창에서 그 통계를 살펴보거나, 또는 해당 기선에 대한 GPS 기선 처리 보고서를 만드는 방식으로 얻을 수 있습니다.

행 2

두번 째 행은 '경사' 식별자가 나오고, 그 다음에 GPS 관측치의 사거리, 현행 종점 좌표의 X 좌표가 순서대로 뒤따릅니다.

행 3

세번 째 행은 '총계' 식별자가 나오고, 그 다음에 지금까지 루프를 구성한 총 트래버스 거리, 현행 종점 좌표의 Y 좌표가 순서대로 뒤따릅니다.

행 4

마지막 행은 식별자가 없습니다. 현행 종점 좌표의 타원체고가 표시됩니다.

참조: 이 보고서의 X 좌표/Y 좌표/타원체고 좌표는 해당 프로젝트에서의 좌표와 동일하지 않습니다. 여기에 표시되는 값은 GPS 관측치를 처음의 시점 좌표에 더하고, 해당 루프를 따라 이 벡터 합산 과정을 계속함으로써 도출하는 좌표입니다. 루프의 끝에 도달하게 되면, 이 방식으로 도출한 좌표를 시점의 원래 좌표와 비교하여 폐합차를 계산합니다.

이 테이블의 마지막 하위 섹션은 시점에 대한 것으로서, 루프가 폐합되었다는 사실을 나타냅니다. 이 두 행은 루프 폐합차에 관한 정보입니다.

정밀도

백만분율로 표시한 수평 및 수직 폐합차의 총계

오차

이 루프에서의 수평 및 수직 폐합차


    [GPS 루프 폐합 설정] 대화 상자

추가 정보

 방법 ...

이 대화 상자를 이용하여 루프 폐합 옵션을 설정하고 GPS 루프 폐합 보고서에 포함할 섹션을 선택합니다.

이 대화 상자를 불러오려면

  [보고서 / 설정 / GPS 루프 폐합 보고서]를 선택하거나

  <Alt+RSL>을 누릅니다.

루프의 레그 수

루프의 변(side)을 형성하는 관측치의 수를 표시합니다. 기본값은 3입니다. 지정한 레그(leg)의 수가 3보다 큰 경우, 레그가 이 갯수 이하인 루프는 전부 만들어지게 됩니다. 다시 말해, 만일 5가 명시되었다면 변이 5개나 4개, 3개인 루프는 모두 이 보고서의 고려 대상이 됩니다.

허용 편차

해당 프로젝트의 정확도 요건을 충족하는 최대 허용 폐합차입니다. 이 값을 초과하는 폐합차는 GPS 루프 폐합 보고서에서 불합격 루프로 보고됩니다. 허용 편차는 절대 거리나 백만분율의 비율로 표시할 수 있습니다.

[절대]를 선택하면 [수평] 및 [수직] 필드가 활성화되는데, 수평 거리 허용 편차와 수직 거리 허용 편차를 각각 입력하여 최대 허용 폐합차를 설정합니다.

[비율]을 선택하면 [Ppm] 필드가 활성화되는데, ppm 단위의 최대 허용 폐합차를 입력합니다. [비율]을 선택할 경우, 폐합차 허용 범위 검정을 실행하기 전에 수평 및 수직 폐합차가 결합됩니다.

보고서 섹션

GPS 루프 폐합 보고서에 포함할 수 있는 섹션은 다음과 같은 것이 있습니다.

  전체 요약

  불합격 루프

  불합격 루프 내역

  불합격 루프상의 관측치

  불합격 루프상의 선점

  합격 루프

  합격 루프 내역

기본값으로 포함되는 섹션은 다음과 같습니다.

  전체 요약

  불합격 루프

  불합격 루프상의 관측치

  불합격 루프상의 선점

이 기본값 섹션들도 그 확인란을 선택 해제하면 보고서에서 제외됩니다. 기타 다른 섹션들은 그 확인란을 선택함으로써 보고서에 포함할 수 있습니다.

활성해만 이용

루프 폐합 보고서에 활성해만 포함시키려면 이 확인란을 선택합니다.


    [GPS루프 폐합 보고서] 명령

방법 ...	보고서

이 명령을 이용하여 루프 폐합 분석을 하고 그 결과를 보고서 포맷으로 봅니다.

이 보고서를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되면서 GPS 루프 폐합 보고서를 로드합니다.


    GPS루프 폐합 보고서 설정

추가 정보

방법 ...	대화 상자

이것을 이용하여 GPS루프 폐합 보고서에 포함할 섹션을 선택합니다.

[GPS루프 폐합 보고서 설정] 대화 상자를 불러오려면,

  [보고서 / 설정 / GPS 루프 폐합 보고서]를 선택하거나

  <Alt+RSL>을 누릅니다.

사용자의 기본 HTML 뷰어가 실행되고 [GPS 루프 폐합 보고서 설정] 대화 상자가 나옵니다.

참조: 기본값으로 나오는 섹션 이외에, 다른 섹션도 별도 추가할 수 있습니다. 이 확인란들을 적절히 결합 선택하면 보고서의 수록 섹션을 마음대로 조정할 수 있습니다.


[루프 폐합 보고서] 대화 상자

폐합 보고 대상을 전체 데이터베이스로 할 것인지, 아니면 선택한 루프로 할 것인지 정하는 대화 상자입니다.

이 GPS 루프 폐합 보고서를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되면서 GPS 루프 폐합 보고서 를 로드합니다.


루프 폐합 확인하기

기선 처리가 끝나고 나면, 측량 보기 창에서 붉은 색 경고 플래그가 기준 미달의 불합격 기선에 표시될 수 있습니다. 이 붉은 플래그의 기선은 루프 폐합 분석시 큰 폐합차를 유발하는 원인이 될 수도 있습니다.

과다한 폐합차를 유발할 수 있는 원인:

  잘못된 측량점상에서 루프 설정

  부정확한 안테나 정보의 입력

  불량한 처리 결과

루프 폐합을 확인하려면

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	[요약]을 클릭합니다.

루프 폐합 보고서의 요약 섹션이 나옵니다.


GPS루프 폐합 보고서 설정하기

 개요 및 추가 정보

GPS루프 폐합 보고서는 해당 섹션을 선택하거나 선택 해제함으로써 그 수록 내용을 조정할 수 있습니다. 기본값으로 포함되는 섹션은 다음과 같습니다.

  요약

  불합격 루프

  불합격 루프상의 관측치

  불합격 루프상의 선점

추가로 이용할 수 있는 섹션:

  불합격 루프 내역

  합격 루프

  합격 루프 내역

보고서 섹션을 이용하거나 이용 해제하는 방법:

1.	GPS루프 폐합 보고서를 보기 위하여

  [보고서 / 설정 / GPS 루프 폐합 보고서]를 선택하거나

  <Alt+RSL>을 누릅니다.

[루프 폐합 설정] 대화 상자가 나옵니다.

2.	[보고서 섹션] 상자에서 해당 확인란을 선택하거나 선택 해제합니다.


GPS루프 폐합 보고서의 요약 보기

 개요 및 추가 정보

보고서 요약을 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	[요약]을 클릭합니다.

요약 섹션이 나옵니다.


GPS 루프 폐합 보고서 보기

 개요 및 추가 정보

보고서를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고 보고서가 나옵니다.

3.	'내용' 하이퍼링크를 이용하여 보고서 섹션으로 바로 이동한 다음, 그 데이터를 봅니다.


GPS루프 폐합 보고서의 헤더 보기

 개요 및 추가 정보

보고서 헤더를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	스크롤 바를 이용하여 그 데이터를 봅니다.


GPS루프 폐합의 합격 루프 통계 보기

 개요 및 추가 정보

합격 루프 섹션은 어떤 루프가 폐합치 설정 기준을 통과하였는지 보여줍니다. 이 보고서 섹션은 기본 보고서에 포함되지 않지만 [루프 폐합 설정] 대화 상자에서 별도로 선택하면 포함할 수 있습니다 .

합격 루프 통계를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	[합격 루프]를 누릅니다.

합격 루프 섹션이 나옵니다.


GPS루프 폐합의 합격 루프 내역 보기

 개요 및 추가 정보

합격 루프 내역 섹션은 폐합치 설정 기준을 통과한 루프의 정보를 보다 상세히 표시합니다. 이 보고서 섹션은 기본 보고서에 포함되지 않지만 [루프 폐합 설정] 대화 상자에서 별도로 선택하면 포함할 수 있습니다 .

합격 루프 통계를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	[합격 루프 내역]을 누릅니다.

합격 루프 내역 섹션이 나옵니다.


GPS루프 폐합의 불합격 루프 내역 보기

 개요 및 추가 정보

이 섹션에는 폐합차 설정 기준을 통과하지 못한 루프의 정보가 보다 자세히 나옵니다. 이 섹션은 기본 보고서에 포함되지 않지만 [루프 폐합 설정] 대화 상자에서 별도로 선택하면 포함할 수 있습니다 .

불합격 루프의 내역을 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

3.	[불합격 루프 내역]을 누릅니다.

불합격 루프 내역 섹션이 나옵니다.


불합격 루프상의 관측치 통계 보기

 개요 및 추가 정보

'불합격 루프상의 관측치' 섹션은 불합격 루프를 모두 점검하고 다중 불합격 루프에 있는 기선을 보고하므로 그 망에 어울리지 않는 GPS 기선을 식별하는 데 도움이 됩니다. 불합격의 정도가 가장 심한 루프의 기선이 목록의 제일 위에 나오고, 또한 기선 요약 통계가 있어 불량 해를 손쉽게 식별할 수 있습니다.

불합격 루프상의 관측치를 보는 방법:

1.	GPS루프 폐합 보고서를 보기 위하여

  [보고서 / 루프 폐합 보고서]를 선택하거나

  <Alt+RL>을 누릅니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

2.	[불합격 루프상의 관측치]를 누릅니다.

불합격 루프상의 관측치 섹션이 나옵니다.


불합격 루프상의 선점 통계 보기

 개요 및 추가 정보

'불합격 루프상의 선점' 섹션은 불합격 루프를 모두 점검하여 다중 불합격 루프에 있는 기선을 결정한 후, 이 기선에 공통되는 선점을 보고하므로 해당 망에 어울리지 않는 기선의 GPS 스테이션 선점을 식별하는 데 도움이 됩니다. 이 스테이션 선점은 스테이션 설치 오차가 있을 수 있습니다. 이 목록은 불합격의 정도가 가장 심한 루프에서 발생하는 선점이 제일 위에 나오게 정렬됩니다.

불합격 루프상의 선점을 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	[불합격 루프상의 선점]을 누릅니다.

불합격 루프상의 선점 섹션이 나옵니다.


불합격 루프 통계 보기

 개요 및 추가 정보

불합격 루프 통계를 검토하면 기선 루프의 레그가 폐합에 실패한 이유를 알 수 있습니다.

불합격 루프 통계를 보려면,

1.	[보고서 / GPS루프 폐합 보고서] 명령을 실행합니다. 그래픽 창에서 관측치를 선택하였다면 [루프 폐합 보고서] 대화 상자가 나옵니다.

2.	다음 중 한 옵션을 선택합니다.

  선택 부분 � 선택한 기선에서 루프 폐합을 수행합니다.

  전체 데이터베이스 � 전체 데이터베이스에서 루프 폐합을 수행합니다.

루프 폐합 분석이 완료되면 사용자의 기본 HTML 뷰어가 실행되고, 상단에 '헤더'가 있는 보고서가 나옵니다.

3.	[불합격 루프]를 누릅니다.

불합격 루프 섹션이 나옵니다.


기선 경고 플래그 등록 정보 보기

 개요 및 추가 정보

기선 처리가 끝나고 나면, 붉은 색 경고 플래그가 그래픽 창의 불합격 기선에 표시됩니다.

경고 플래그의 내역을 보려면,

1.	어떤 기선을 선택합니다.

2.	등록 정보 창을 엽니다. (마우스의 오른쪽 누르기로 나오는 바로 가기 메뉴에서 [등록 정보]를 선택)

등록 정보 창이 나옵니다.

3.	등록 정보 창의 선택 목록에서 그 기선 옆에 있는 플러스 부호(+) 아이콘을 누릅니다.

선택 목록의 트리 구조가 펼쳐지고 기선의 시점과 종점이 표시됩니다. 붉은 색 플래그는 기선 처리의 문제가 있음을 나타냅니다.

4.	플래그가 있는 아무 포인트나 선택합니다.

5.	다음 중 하나를 합니다.

  '경고 플래그' 단추를 누릅니다.

  '상세 페이지 메뉴'에서 [경고]를 선택합니다.

이 기선에 플래그가 붙은 이유를 설명하는 메시지가 나옵니다. 이 정보를 토대로 해당 기선의 문제를 해결합니다. 자세한 사항은 GPS 처리 데이터 분석을 참조하십시오.


재계산 - 개요
재계산 − 개요

재계산이란 포인트의 계산된  위치를 수립하는 과정을 의미합니다.

Trimble Geomatics Office는 포인트에 대한 모든 데이터,  즉 모든 GPS, 광파, 및 레이저 거리계 관측치, 그리고 키입력 좌표 및 외부에서 가져온 좌표의 재계산을 수행합니다. 이 소프트웨어는 이들 관측치와 키입력 좌표를 사용하여 포인트에 대한 가능한 최상 등급 의 위치를 결정 합니다.

재계산은,

 현장에서 측정한 포인트의 위치를 계산합니다.

  포인트에 적절한 등급을 부여합니다.

  데이터의 폐합오차를 탐색 및 보고합니다.

  재계산 보고서를 만듭니다.

만약 포인트에 여유 측량 데이터가 있을 경우, 이 중에서 어떤 관측치 (또는 키입력 좌표)가 포인트의 위치계산에 사용 되었는 지를 포인트 도출 보고서에서 보여줍니다.  재계산 보고서에는 허용 편차 이상의 오차를 가진 모든 여유 관측치가 열거됩니다. 허용 편차는 [프로젝트 등록 정보] 대화 상자의 [재계산] 탭에 정의되어 있습니다.

프로젝트에 데이터를 추가하거나 기존의 데이터를 수정하면 재계산을 해야 합니다. 예를 들어 GPS 관측을 위해 안테나 높이를 변경하면 그 때마다  재계산을 해야 합니다.

그러나Trimble Geomatics Office는 재계산을 자동으로 수행하지 않습니다. 재계산이 필요하면 Trimble Geomatics Office 상태 표시줄에 재계산 아이콘 [image] 이 나타납니다.

재계산을 하려면, 다음 중 하나의 방법을 이용 합니다.

 [측량 /  재계산]을 선택합니다.

  F4를 누릅니다.

  상태 표시줄에 재계산 아이콘이 있을 경우 이를 더블 클릭합니다.

  바로가기 메뉴를 이용하고자 하면 마우스의 오른쪽 단추를 클릭한 후 '재계산' 옵션을 선택합니다.

참조: 재계산은 언제든지 시행할 수 있지만, 상태 표시줄에 먼저 재계산 아이콘이 표시되지 않으면 아무것도 변경되지 않습니다.

재계산은,

  오차를 배분하지 않습니다.

  관측치에 우선하여 조정 등급, 기준 등급  혹은 측량 등급의 키입력 좌표를 이용합니다.

참조: 키입력 좌표 란 Trimble Geomatics Office에서 직접 키입력한 포인트 좌표, 혹은 외부 데이터 파일로부터 Trimble Geomatics Office 프로젝트로 가져온  포인트 좌표를 의미합니다.


재계산 - 관측된 포인트의 계산된 위치는 어떻게 결정되는가
재계산 − 관측된 포인트의 계산 위치 결정 방법

 개요 및 추가 정보

다음 순서도는 재계산 기능이 작업현장에서 관측한 포인트의 위치를 어떻게 재계산해 내는지를 보여줍니다.

참조: 관측된 포인트의 위치를 계산할 때, 재계산 기능은 '불이용' 상태의 관측치나 '불이용' 상태의 키입력 좌표는 사용하지 않습니다. 만일 프로젝트 내의 포인트에 대한 위치를 다른 어떤 관측치나 좌표로써 결정할 수 없을 때만 '점검점으로 이용' 상태인  관측치 혹은 키입력 좌표를 사용합니다.  관측치를 '이용', '불이용' 상태로 변경하려면, 등록 정보 창을 이용하십시오.

다음 항목은 순서도 내의 박스에 대해  설명합니다.

  재계산: 잠재 시점의 결정

  재계산: 모든 잠재 시점의 위치 결정

  재계산: 구성 요소의 질로써 현재 시점을 결정

  재계산: 현재 시점으로부터의 관측치 적용

  재계산: 관측된 포인트의 등급 결정


재계산 - 재계산은 잠재 시점을 어떻게 결정하는가
재계산 − 잠재 시점의 결정

 개요 및 추가 정보

재계산은 다음과 같은 특징이 있는 포인트면 어느 것에서나 시작할 수 있습니다.

  키입력 좌표, 그리고

  이 포인트를 시점으로하는 관측치가 하나 혹은 그 이상

예를 들어, 다음 그림은 실시간 Kinematic (RTK) 베이스를 보여줍니다.  이는 하나의 잠재 시점입니다.


재계산 -  모든 잠재 시점의 위치는 어떻게 결정 되는가
재계산 −  모든 잠재 시점의 위치 결정

 개요 및 추가 정보

시작점의 위치는 해당 키입력 좌표로부터 결정됩니다. 잠재 시점은 보통 단 한 세트의 키입력 좌표를 가집니다. 각 위치 구성 요소(NE,e,h)의 질은 키 입력된 좌표의 질에서 물려받습니다. 만일  표고 혹은 타원체고 구성 요소가 키입력되지 않으면, 없는 구성 요소를 도출하기위해 지오이드 모델이 사용됩니다.

다음의 경우에는 포인트가 한 세트 보다 많은 키입력 좌표를 가질 수 있습니다:

  포인트의 좌표를 키입력하고,  해당 포인트를 고정하지 않은 채로 조정 (망 조정 모듈이 설치되어 있는 경우)을  할 경우 ( 이렇게 하면 포인트의 조정된 좌표 세트가 만들어집니다)

  포인트의 WGS-84 좌표 및 그리드 기준좌표를 가져올 경우

  WGS-84 좌표 및 표고를 가져올 경우. 표고는 그리드 좌표의 일부로 저장됩니다.

이 경우, 재계산은 계산 위치로 사용할  좌표를 결정하기 위해  일정한 기준을 적용합니다. 만일 첫번째 기준을 사용해서 한 세트의 좌표를 찾을 수 없으면, 그 다음 기준을 적용합니다. 적용하는 기준의 순서는 다음과 같습니다:

1.	좌표의 상태 (이용 / 불이용)

2.	최상 등급의 구성 요소

3.	그리드 좌표에 우선하여 WGS-84 좌표 사용


재계산 - 모든 잠재 시점의 위치 결정 : (1) 좌표의 상태
재계산 − 모든 잠재 시점의 위치 결정 : (1) 좌표의 상태

 기타

좌표의 상태 (이용 / 불이용)

'이용' 상태로 설정된 좌표만이 시점의 위치 결정시에 반영됩니다. 점검점 좌표는 관측치가 포인트의 좌표 설정에 이용되지 않을 경우에만 시점의 위치 결정에 쓰입니다.

참조: 점검점 좌표는 시점의 좌표 설정에 쓰이는 경우가 거의 없습니다.

'불이용' 상태인 좌표는 절대로 반영되지 않습니다. 좌표의 이용 및 이용 해제는 등록 정보 창이나 [다중 편집] 대화 상자에서 설정합니다.

최상 등급의 구성 요소

'이용' 상태로 설정된 좌표가 2 세트 이상일 경우, 재계산은 가능한 모든 키입력 좌표에서 최상 등급의 구성 요소를 취합니다. 구성 요소는 다음 3가지입니다.

  수평

  표고

  타원체고

참조: 이 구성 요소는 동일한 좌표 그룹에서 나와야 할 필요는 없습니다.

다음은 구성 요소 3 개의 등급과 그 순위를 높은 순으로 표시한 표입니다. 등급의 순서는 '등급 서열'이라 부릅니다.

등급 심벌은 등록 정보 창에서 각 구성 요소의 옆에 나타납니다.

좌표형

두 좌표의 등급이 동일한 경우, 재계산은 좌표 종류를 기준으로 택일합니다. WGS-84 좌표가 그리드/로컬 좌표에 우선합니다.


재계산 -  구성 요소의 질은 현재시점을 어떻게 결정하는가
재계산 −  구성 요소의 질로써 현재 시점을 결정

 개요 및 추가 정보

만일 두 개 이상의 잠재시점이 있으면, 재계산은 최상 등급의 포인트를 현재 시점으로 선택하며, 다음의 서열을 기준으로 합니다.

1.	기준

2.	조정

3.	측량

4.	매핑

5.	미지

각각 구성 요소의 질을 고려합니다.  해당 포인트 위치에 대한 등급이 각 구성 요소마다 다르면, 수평 등급을 맨 먼저, 그 다음으로 타원체고, 그리고 맨 나중에 표고를 고려합니다.

다음 표는 어떤 잠재 시점을 현재 시점으로 할 것인지를 결정하는 등급 서열의 일부를 보여 줍니다. (등급 서열은 이 표에 표시된 것보다 더 많습니다). 어둡게 색을 칠한 칸이 재계산에서 선호되는 등급입니다.

예를 들어, 한 포인트는 다음과 같은 구성 요소 등급을 가질 수 있습니다:

  수평 등급  - 기준

  타원체고 등급  - 미지

  표고 등급 - 미지

  이 등급의 포인트는 다음과 같은 구성 요소 등급을 가진 포인트에 우선하여 시점으로 사용됩니다.

  수평 등급 - 측량

  타원체고 등급 - 측량

  표고 등급 - 매핑

시점이나 개시 좌표(seeding coordinate)로 이용하고자 하는 포인트는 반드시  기준 등급의 구성 요소를 가지고 있어야 합니다.

참조: 모든 구성 요소의 등급이 똑같은 시점이 두 개 이상이면, 재계산은 프로젝트에 먼저 나오는 포인트를 사용합니다.


재계산 - 관측치는 현재시점으로부터 어떻게 적용되나
재계산 − 현재 시점으로부터의 관측치 적용

 개요 및 추가 정보

재계산은 관측치의 종류에 따라 서로 다른 방법으로 시점의 관측치를 적용합니다.

 GPS 관측치는 WGS-84 타원체 상

 광파 및 레이저 거리계 관측치는 로컬 타원체 상 � [비 GPS 관측치를  타원체 기준으로 축소 변환 (해수면 보정)] 옵션을 선택하지 않은 경우는 제외

이 옵션은 [프로젝트 등록 정보] 대화 상자의 [재계산] 탭에 있습니다. 이 경우, 재계산은 비 GPS 관측치를 지상 기준에서 적용합니다. 자세한 내용은 타원체면 보정 항목을 참조하십시오.  조정이 수행되면 모든 거리는 타원체 기준으로 축소 변환 됩니다.

  델타 표고  - 초기 재계산에서 기존 표고에 적용됩니다.


재계산 - GPS 관측치는 어떻게 적용되는가
재계산 − GPS 관측치의 적용 방법

 개요 및 추가 정보

GPS 관측치는 Trimble Geomatics Office 프로젝트에 지상-대-지상 벡터로 저장됩니다.  그러나 작업현장에서 GSP 벡터는 안테나 페이즈 센터-대-안테나 페이즈 센터 (APC-APC)로 관측됩니다.

가져오기를 하는 동안, Trimble Geomatics Office는 각 기선 끝에서 GPS 안테나의 높이를 사용하여 GPS 벡터를 지상-대-지상 벡터로 변환 합니다.  안테나 높이가 수정되면  해당-지상-대 지상 벡터는 자동으로 업데이트됩니다.

참조: 기선 처리기는 지상-대-지상 벡터를 산출합니다.

재계산은 GPS로 관측된 포인트의 위치를 결정하기위해 다음 과정을 수행합니다:

1.	현재 시점의 좌표를 WGS-84위도, 경도 , 타원체고 (LLh)로 변환합니다.

2.	이 좌표들을 WGS-84  Cartesian 좌표 (X, Y, Z)로 변환합니다.

3. 	지상-대-지상 GPS 벡터(델타 X, 델타 Y, 델타 Z)를 해당 시점의 WGS-84 Cartesian 좌표에 적용합니다. 관측된 포인트의 Cartesian WGS-84 위치가 결정됩니다.

참조: 망 조정된 매개 변수가 프로젝트에 사용된 경우에는 비록 그 기선이 망 조정에 사용되지 않았다 하더라도, 그 적용된 GPS 벡터가 조정 벡터가 됩니다.

4.	관측된 포인트를 WGS-84 위도, 경도, 타원체고로 변환합니다.

5.	해당 프로젝트의 좌표계를 이용하여 각 포인트의 투영 좌표를 그 WGS-84 위치로부터 도출합니다. 또한 해당 프로젝트에 적용된 모든 GPS 사이트 캘리브레이션도 사용합니다.

6.	 그 결과, 도출되는 좌표가 해당 포인트의 현재 위치가 됩니다.


재계산 - GPS 기선의 방향
재계산 − GPS 기선의 방향

 개요 및 추가 정보

재계산은 모든 실시간 Kinematic (RTK) GPS 관측치를 해당 벡터가 관측된 방향 (베이스에서 로버로)으로 적용합니다(기본값임).

Static 과 Faststatic 후처리 기선의 방향은 기선 처리 중 개시(seeding) 관측에 의해 결정됩니다. 해당 프로젝트에 그 방향이 저장되면 그래픽 창의 기선에 화살표가 표시됩니다.  개시 알고리즘은 벡터가 최상급 위치의 포인트에서 최하급 위치의 포인트 방향으로 처리되도록 합니다. 그 후 재계산은 해당 프로젝트에 저장된 방향으로 벡터를 적용합니다.

GPS 벡터의 방향을 바꾸어 벡터가 반대 방향으로 적용되도록 할 수 있습니다.

그렇게 하려면, 해당 관측치를 선택하고 [편집 / 관측 방향 반전]을 선택하십시오. 이 경우, 벡터의 시점은 알려진 위치(예: 키입력된 WGS-84 위도, 경도, 타원체고 좌표)여야  합니다. 알려진 위치가 해당 포인트에 없다면 관측치가 적용되지 않습니다.


재계산 - 광파 및 레이저 거리계 관측치는 어떻게 적용되는가
재계산 − 광파 및 레이저 거리계 관측치의 적용 방법

 개요 및 추가 정보

광파 관측치를 가져올 경우:

 수직각은 곡률과 굴절 보정이 이루어집니다.

 사거리는 대기 오차 보정이 이루어집니다 (ppm 보정).

  수평 관측치는 후시로부터의 수평각으로 변환됩니다.

재계산은 광파 혹은 레이저 거리계로 관측된 포인트의 위치를 결정하기위해 다음을 실행합니다.

1.	재계산은 다음 중 하나를 실행합니다.

  만일 관측치가 레이저 거리계 관측치이면, 자기 편각을  관측된 방위각에  적용합니다.

  만일 관측치가 광파 관측치이면, 재계산은 프리즘 상수를 해당 사거리에  적용합니다.

2.	관측된 사거리를 수평 지상거리로 축소 변환합니다.

3.	만일 [프로젝트 등록 정보] 대화 상자의 [재계산] 탭에서 [비 GPS 관측치를  타원체 기준으로 축소 변환 (해수면 보정)] 옵션을 선택하면, 지상 거리를 타원체 거리로 축소 변환합니다.

4.	기계고를 로컬 타원체고에 추가합니다.

5.	현재 시점을 로컬 위도 ,경도, 타원체고(관측치는 타원체를 따라 적용됨)로 변환하기 위해 해당 프로젝트에 정의된 좌표계를 사용합니다.

6.	후시 방위각을 결정하기위해 다음 규칙을 사용합니다 (광파 관측치의 경우에만 적용).

  만일 기계점과 후시점의 위치만 알려져 있으면(즉, 키입력 방위각이 없다면) , 재계산은 두 포인트 간 인버스에서 얻어진 후시 방위각을 사용합니다

 만일 키입력 방위각만 이용이 가능하고, 해당 종점이 좌표를 가지고 있지 않으면,  재계산은 키입력 방위각을 후시 방위각으로 사용합니다.

  만일 기계점 및 후시점의 위치가 모두 알려지고, 키입력 방위각이 이용가능하면, 재계산은 각 방위각의 등급을 결정하고, 어떤 방위각을 후시 방위각으로 사용할 것인지 결정하기 위해 아래의 표에 있는 서열을 사용합니다.

예를 들어, 만일 기준 등급 키입력 방위각과 함께 측량 등급의 기계점과 후시점 쌍이 있으면, 키입력 방위각이 후시 방위각으로 사용됩니다.

참조: 후시 방위각의 등급을 계산하기위해서 기계점과 후시점의 수평 등급을 검토하여 최하 등급을 취합니다. 예를 들어, 만일 기계점이 기준 등급이고 후시점이 매핑 등급이면, 후시 방위각은 매핑 등급이 됩니다.

종류	등급
좌표로부터 도출	기준
키입력 방위각	기준
좌표로부터  도출	측량
키입력 방위각	측량
좌표로부터 도출	매핑
키 입력 방위각	매핑
참조:  만일 기계점과 후시점 간에 결정된 방위각에 우선하여 키입력 방위각을 재계산에 쓰도록 하려면, 키입력 방위각 위치의 등급을 올려서 기계점과 후시점 간에 결정된 방위각보다 그 서열을 높게 해야 합니다.

팁: 키입력 방위각의 등급은 수정할 수 있습니다.

7.	그리드 방위각을 결정하기 위해서 수평각을 후시 방위각에 적용합니다 (광파 측정치의 경우에만 해당).

8.	그리드 방위각을 결정하기 위해서 자기 편각을 자기 방위각에 적용합니다 (레이저인 경우에만 해당).

9.	관측된 포인트의 로컬 위도와 경도를 결정하기 위해서 타원체를 따라 관측치를 적용합니다.

10. 관측된 포인트의 표고를 결정하기 위해서, 기계고에서 타겟 높이를 빼서 델타고를 구합니다. 그 다음, 이 델타고를 측량기 설치점의 표고에 더합니다.

11. 해당 프로젝트의 좌표계를 이용하여 좌표를 로컬 그리드 좌표로 변환합니다.


재계산 - 델타 표고는 어떻게 적용되는가
재계산 − 델타 표고의 적용 방법

델타표고는 재계산을 하는 중에 적용됩니다. 재계산은 델타 표고의 유출(Flow out)을 위해 다음을 실행합니다:

  시점의 표고를 결정합니다.

  델타 표고를 시점에 적용하여 새 포인트의 표고를 결정합니다.

재계산이 이루어지는 동안 델타 표고가 키입력 표고로부터 유출될 수 있도록 하기 위해서는 시점이 반드시 키입력 표고를 가지고 있어야 합니다.

델타 표고가 레벨런 처음부터 유출될 수 있도록 사용자는 레벨런을 시작할 때 표고를 입력해야만 합니다.

예를 들어, 아래의 그림에서 델타 표고 관측치를 사용하여 포인트 B, C, D의 표고가 결정되도록 하려면, 포인트 A 는 반드시 키 보드 입력 표고를 가지고 있어야 합니다. 만약 포인트 A로의 관측치가 A에서의 표고를 계산하기에 충분한 정보를 가지고 있다 하더라도, 델타표고는 키입력 표고를 가지지 않는 한 아직도 계산되지 않을 것입니다.


재계산- 예
재계산 − 예

 개요 및 추가 정보

다음 그림은 재계산이 포인트의 좌표를 설정하는 방법을 보여주는 예입니다. A와 I 포인트는 기준 등급 포인트이며 나머지는 측량 등급입니다.

A 와 I 포인트가 둘 다 그 포인트에 해당하는 키입력 좌표와 관측치를 가지고 있으므로, 재계산은 이 두 포인트를 잠재시점으로 정합니다. A와 I포인트는  같은 등급 (기준 등급 L, L, h)이므로, 재계산은  프로젝트에 먼저 입력된 A 포인트를 현재 시점으로 선택합니다.

재계산은 더 이상 진행할 수 없을 때 까지 해당 시점의 모든 관측치를 사용하여 포인트의 좌표를 설정 합니다. 따라서 A 포인트에서 B, C, D, E, F, G, H 포인트의 좌표를 설정합니다.

현재 시점 (A 포인트)에 관측치가 더 이상 없으므로 재계산은 I 포인트를 새로운 현재 시점으로 선택합니다. 재계산은 I 포인트에서 J, K, L 포인트의 좌표를 설정합니다.

I 포인트에서 D 와 H 포인트로의 관측치가 있습니다. 재계산은 이미 이 포인트들의 좌표를 설정했으므로, 이 포인트들에 대한 폐합을 표시합니다. 만일  폐합오차가 [프로젝트 등록 정보] 대화 상자 내 [재계산] 탭 의 설정 허용 편차보다 크면, 그래픽 창에 있는 관측된 해당 포인트에 경고 플래그가 나타나며, 그 폐합은 재계산 보고서에 반영됩니다.

경고: D 포인트가 B 와 I 포인트의 관측치로부터 도출될 수 있습니다. 이들 관측치의 등급과 상관없이  B의 관측치가 사용됩니다. 이는 D가 먼저 B에서 좌표설정이 되었기 때문입니다. 만일 사용자가 I로부터의 관측치를 사용하기를 원하면, B에서 D로의 관측치 상태를 "점검점으로 이용"으로 변경해야 합니다.


재계산 - 한 포인트에 대한 복수 관측치 및 복수 좌표
재계산 − 한 포인트에 대한 복수의 관측치 및 좌표

 개요 및 추가 정보

하나의 포인트에는 그 포인트로의 여러 관측치와 여러 키입력 좌표가 있을 수 있습니다.  만일 [프로젝트 등록 정보] 대화 상자의 [재계산] 탭에서 [최적 관측치 이용] 옵션을 선택하면, 해당 포인트의 위치 구성 요소 (NE, e, h)를 도출하기 위해 단 하나의 관측치 (혹은 좌표)만을 사용합니다. 예를 들어, 한 포인트에 두개의 관측치와 하나의 키입력 좌표가 있을 수 있습니다. 이 경우, 해당 포인트의 좌표 설정에 키입력 좌표가 해당 관측치에 우선하여 사용됩니다. 재계산이 사용하지 않은 다른 관측치, 혹은 키입력  좌표들은 재계산 보고서에 반영됩니다

참조: 만일  [프로젝트 등록 정보] 대화상자의 [재계산] 탭에서 [같은 종류의 관측치를 평균 계산] 옵션을  선택하면, 모든 관측치가 사이드샷 포인트의 좌표 구성 요소 계산에 반영됩니다. 사이드샷 포인트들 만 평균 계산 됩니다.

한 포인트로의  복수 관측치

[최적 관측치 이용] 옵션이 선택된 경우 복수 관측치를 가진 포인트의 계산 좌표를 결정하기 위해서 재계산은 다음과 같은 관측치 서열을 사용합니다.

1.	관측치 상태 (이용, 점검점으로 이용, 불이용)

2.	관측치 등급

3.	관측치 종류 (GPS, 광파, 레이저, 축소 변환)

4.	정밀도

5.	해당 프로젝트에서의 첫번 째 관측치


재계산 - 사이드샷 포인트로의 복수 관측치
재계산 − 사이드샷 포인트로의 복수 관측치

 개요 및 추가 정보

관측치(GPS혹은 광파)가 Trimble Geomatics Office로 전달되면, 이 소프트웨어는 각 관측치가 사이드샷 인지를 결정합니다. 사이드샷은 다음과 같은 포인트로의 관측치입니다.

   그 포인트를 시점으로 하는 관측치가 없는 포인트

   그 포인트를 종점으로 하는 Static 혹은FastStatic 관측치가 없는 포인트

  기준점이 아닌 포인트

다음 그림은 서로 다른 두 상황에서 사이드샷 포인트가 어떻게 발생하는지를 보여줍니다.

[프로젝트 등록 정보] 대화상자의 [재계산] 탭 에서 [복수의 사이드샷 관측치] 표의 설정을 어떻게 하느냐에 따라 해당 사이드샷 포인트의 위치를 계산하는 데 어떤 관측치를 사용할 것인가가 결정됩니다.

참조: 재계산은 복수의 사이드샷 표고를 평균 계산하지 않습니다.


재계산 - 복수 관측치 및 좌표 평균계산
재계산 − 복수 관측치 및 좌표 평균 계산

 개요 및 추가 정보

[프로젝트 등록 정보] 대화상자의 [재계산] 탭에서 [같은 종류의 관측치를 평균 계산] 옵션은 선택되어 있지 않습니다(기본값임). 따라서 복수 관측치가 평균 계산 되지 않습니다.

만일  사용자가 이 옵션을 선택하면, Trimble Geomatics Office는 사이드샷 포인트로의 각 관측치로부터 계산 좌표를 평균 계산합니다.

참조: 만일 해당 포인트가  트래버스 점이면, 재계산은 해당 포인트의 위치를 결정하기 위해 하나의 관측치 혹은 좌표만을 사용합니다.

사이드샷 포인트에 대한 위치를 평균 계산하는 규칙은 다음과 같습니다.

  재계산은  같은 종류의 관측치 만을 평균 계산 합니다. 예를 들어, GPS 관측치는 광파 관측치와 평균 계산 할 수 없습니다. 이런 경우에 재계산은 광파 관측치에 우선하여 GPS 관측치를 사용합니다.

  재계산은 관측치로부터 도출된 좌표만 평균 계산 합니다. 예를 들어, 만일 한 포인트가 두개의 관측치와 키입력좌표 들을 가지고 있으면, 재계산은 해당 관측치를 평균 계산 하여 해당 좌표와 등급을 결정합니다. 그 후, 키입력 좌표와 평균 좌표를 비교하여 최상 등급 좌표를 해당 포인트의 위치로 사용합니다.

참조: '이용'  상태로 설정된 관측치가 하나 혹은 그 이상이면, 재계산은 평균 위치를 결정하기 위해 '점검점으로 이용' 상태의  관측치를 사용하지 않습니다.

재계산은 포인트의 계산된 위치를 결정하기위해 해당 포인트로의 각 관측치로부터 위치를 계산합니다. 각 관측치는 그 정밀도 값에 따라 중요도가 결정됩니다. 정밀도 값이 좋을수록 평균 좌표 값에 대해 가지는 관측치의 영향력이 큽니다.

GPS 관측치의 경우 재계산은 [정밀도] 필드를 사용합니다. 정밀도 필드를 보기 위해서는:

1.	GPS 관측치를 선택합니다.

2.	등록 정보 창을 엽니다.

3.	[관측치 통계] 메뉴 단추 [image] 를 클릭합니다.

광파 관측치의 경우에는 등가중법이 사용됩니다.

재계산은 평균 위치를 원의 중심으로 사용하며, 이 원의 반지름은 서클의 허용 편차 거리에 의해 정의됩니다. 허용 편차 거리는 [프로젝트 등록 정보] 대화상자의 [재계산] 탭에 명시되어 있습니다. 만일 좌표 구성 요소가 수평 (X 좌표, Y 좌표) 이면,  재계산은 수평 허용 편차를 사용합니다.  만일 좌표 구성 요소가 수직 (표고 혹은 타원체고) 이면, 수직 허용 편차를 사용합니다.

만일 어떤 위치가 허용 편차에서 정의한 서클 밖에 있으면, 평균 위치에서 가장 멀리 있는 위치가 기각되고  처리가 반복됩니다. 다음 그림에서는  한 사이드샷 포인트에  그 포인트로의 광파 관측치가 셋이 있습니다.

관측치 3은 허용 편차 서클 밖에 있으므로  그 다음 반복 연산에서 제외됩니다.

계산된 위치가 모두 허용 편차 서클 안에 있을 때 까지 나머지 관측치를 가지고  같은 처리를 반복합니다. 다음 그림은 계산된 평균 그리드 좌표가 어떻게 포인트의 최종 계산 좌표가 되는 지를 보여줍니다.

평균 좌표를 결정하기 위해 사용된 모든 관측치가 이제 지정된 허용 편차 내에 있으므로, 재계산은 해당 포인트의 계산된 위치를 연산하기 위해 이 평균 좌표들을 사용합니다.

참조: 만일 사용자가 [프로젝트 등록 정보] 대화상자에 있는 [재계산] 탭의 [허용 편차 확인] 확인란을 선택하지 않으면 허용 편차를 점검하지 않고 같은 종류의 모든 관측치를 평균 계산 합니다. 따라서 이상 값은  발견되지 않습니다.


재계산 -  트래버스 포인트로의 복수 관측치
재계산 −  트래버스 점으로의 복수 관측치

 개요 및 추가 정보

트래버스 측량의 경우, 하나의 트래버스 점은 해당 트래버스 점으로의 관측치를 두 개 이상 가질 수 있습니다. 이를 복수 관측치라 부릅니다.

트래버스 점으로의 복수 관측치는 평균으로 되지 않습니다. 다음 그림에서 표시하는 것과 같이 포인트 1은 그 포인트로의 관측치를 두개 가지고 있고 그 포인트로부터의 관측치를 하나 가지고 있습니다. 해당 포인트의 위치를 정하기 위해,  포인트 1의 위치를 도출하는데 사용되는  관측치는 그 포인트로의 첫번째 관측치입니다.


재계산 - 키입력 좌표와 관측치를 가진 포인트
재계산 − 키입력 좌표와 관측치가 있는 포인트

 개요 및 추가 정보

표시된 포인트의 위치는 다음으로부터 도출될 수 있습니다.

  관측치

  키입력 좌표(예를 들어, 도입한 그리드 좌표)

만일 포인트가 키입력된 좌표와 그 포인트로의 관측치를 가지고 있으면, 재계산은 해당 포인트의 위치를 결정하기 위해 키입력 좌표와 관측치의 등급을 사용합니다. 만일 그 등급이 같으면, 재계산은  관측치 좌표에 우선하여 키입력 좌표를 사용합니다. 따라서, 만일 사용자가 포인트의 위치를 계산하기 위해 관측치를 사용하고자 하면, 해당 포인트로의  어떤 키입력좌표보다 등급이 높은 관측치를 선택해야 합니다.

재계산은 수평 구성 요소 등급과 수직 구성 요소 등급을 각각 별도로 고려합니다. 예를 들어, 포인트의 도입된 그리드 좌표는 측량 등급의 수평 구성 요소 (X 좌표, Y 좌표), 그리고 매핑 등급의 표고 구성 요소를 가질 수 있습니다. 또한 하나의 해당 포인트로의 관측치도 가지고 있습니다. 해당 관측치로 부터 도출된 수직 및 수평 좌표는 측량 등급입니다.

이에 대해서는 다음 표에 요약되어 있습니다.

어둡게 칠한 칸들은 포인트의 위치가 어떻게 결정되는 지를 보여줍니다. 수평 구성 요소 등급이 같으므로 재계산은 관측치에 우선하여 좌표를 사용합니다. 도입된 수직 구성 요소 좌표가  관측치 보다 낮은 등급 이므로 재계산은 관측치 로부터 표고를 도출 합니다.

포인트들의 최적 표고 (혹은 타원체고)는 이용 가능한 모든 키입력 좌표와 포인트로의 관측치를 사용하여 도출합니다. 만일 재계산이 포인트의 표고 (혹은 타원체고)를 계산하기위해 관측치를 사용하면, 나머지 구성 요소는 다음 중 한가지를 사용하여 계산합니다.

  지오이드 모델 및(혹은) 수직 조정

  키입력 좌표

만일 해당 프로젝트에 지오이드 모델이 사용되면, 지오이드 모델에서 도출된 표고 (혹은 타원체고)의 질을 결정하는데 [프로젝트 등록 정보] 대화상자의 [재계산] 탭에 있는 지오이드 모델의 질을 사용합니다. 이 질이 키입력 좌표와 비교되며, 여기에 최적 등급의 표고 (혹은 타원체고) 구성 요소가 사용됩니다.

참조: 만일 캘리브레이션의 수직 조정이 해당 프로젝트 좌표계 정의에 들어 있으면, 도출된 표고 (혹은 타원체고)의 질은 측량 등급이 됩니다.


재계산 - 관측된 포인트의 등급은 어떻게 결정되는가
재계산 − 관측된 포인트의 등급 결정

 개요 및 추가 정보

재계산은 관측된 포인트의 등급을 결정함에 있어 관측 시점의 등급과 그 관측치의 등급을 기준으로 합니다. 이 때, 수평 구성 요소와 수직 구성 요소는 각각 별도로 고려됩니다.

다음은 등급 서열입니다.

1.	기준

2.	측량

3.	매핑

4.	미지

다음 표는 해의 유형(혹은 측정 종류)에 따라 관측치 등급이 어떻게 결정되는지를 보여줍니다.

관측치 종류	해당 관측치에 부여되는 등급
GPS 고정	측량
GPS유동	매핑
GPS단독 측위	미지
광파	측량
레이저 거리계	매핑
델타 표고	측량

포인트의 각 구성 요소 (수평, 표고, 타원체고)에 대하여 부여되는 등급은 다음 두 등급 중 낮은 것입니다.

  관측 시점의 등급

  관측치의 등급


실시간 Kinematic 측량을 위한 단독 베이스 위치
실시간 Kinematic 측량에 대한 단독 측위 베이스의 위치

 개요 및 추가 정보

만일 사용자가 Trimble Survey Controller의 [image] 키를 사용하여 실시간 Kinematic (RTK)  베이스 측량을 시작하고 그 Survey Controller (.dc) 파일을 Trimble Geomatics Office에 전송하면, 해당 베이스 위치(결과적으로 그 베이스로부터의 모든 로버 포인트)는 미지 등급(모든 구성 요소 즉 수평, 타원체고 및 표고에 대해)이 됩니다.

Trimble Geomatics Office에서 GPS 사이트 캘리브레이션을 수행하더라도 수평 및 타원체고 구성 요소의 질은 변경되지 않습니다.

만일 GPS 사이트 캘리브레이션으로 해당 포인트의 등급이 확실히 개선되었다고 생각하면, 등록 정보 창을 이용하여 해당 베이스 포인트의 등급을 변경하도록 합니다.  해당 베이스의 등급을 올리면 로버 포인트의  등급이 개선될 것입니다.

참조: 만일 프로젝트 좌표계 정의에 수직 조정이 들어 있으면 표고 구성 요소의 질은 측량등급이 될 것입니다.


재계산 - Trimble Geomatics Office 소프트웨어를 이용해서 이동 혹은 조정된 포인트
재계산 − Trimble Geomatics Office를 이용해서 이동 혹은 조정된 포인트

 개요 및 추가 정보

재계산은 다음 방법으로 시프트된 포인트를 이동하지 않습니다:

  좌표 이동

  좌표 변환

  표고 조정

  망 조정

어떤  포인트에 이 중 하나가 적용되는 경우에는 그 포인트를 종점으로 하는 관측치로써 도출한 위치는 사용되지 않습니다.


재계산 - 프로젝트 고도
재계산 − 프로젝트고

 개요 및 추가 정보

프로젝트고는 프로젝트 전체에 대한 설정으로, 타원체고가 없는 포인트의 모든 캘리브레이션을 위한 근접타원체고로 사용됩니다. 타원체고가 없는 포인트는 프로젝트고 값으로 업데이트 되지 않습니다. 이는 다음 경우에 한해서 좌표를 변환하는 데 사용됩니다:

  프로젝트의 좌표계가 변경되고, 타원체고가 공백 값일 때

  포인트의 타원체고가 없기 때문에 해수면 보정이 적용될 때

[프로젝트고] 필드는 [프로젝트 등록 정보] 대화상자의  [좌표계] 탭에 있습니다.


재계산 - 점검 관측치
재계산 − 점검 관측치

 개요 및 추가 정보

Trimble Survey Controller로  포인트로의 점검 관측치를 저장할 수 있습니다. 다음은 .dc파일이 Trimble Geomatics Office로 도입될 때 이 포인트들이 어떻게 다루어지는지를  설명합니다.

키입력 기준점이 아닌 포인트로의 점검점

.dc 파일이 도입될 때, '이용' 상태인 해당 포인트로의 관측치를 사용해서 추가된 포인트의 계산된 위치를 도출할 수 있습니다. 점검 관측치는 도입되지만 해당 포인트의 계산된 위치를 결정하는데 사용되지 않습니다. 다만, '이용' 상태인 해당 포인트로의 관측치가 없는 경우에는 예외입니다. 재계산은 항상 ' 이용' 상태의 좌표보다 ' 이용' 상태의 관측치를 먼저 사용합니다. 해당 관측치에는 '점검점으로 이용' 상태가 부여되고, 이는 그래픽 창에 점선으로 나타납니다. 관측치의 상태를 보거나 편집하기 위해서는 [등록 정보] 창의 요약 페이지를 사용하십시오.  해당 포인트의 계산된 위치와 점검 관측치에 의해 결정된 좌표 사이의 폐합오차가 계산됩니다. 이는 가져오기 작업 중에 만들어지는 재계산 보고서 에 반영되고, 프로젝트의 보고서 폴더 내의 재계산 폴더에 위치합니다.

참조: 만일 사용자가 저장된 포인트에 점검 관측치를 저장하면, 그리고 이전에 수집된 포인트를 제거하면, 해당 점검 관측치가 도입되고, 새로운 포인트가 추가됩니다. 해당 관측치의 상태는 '점검점으로 이용' 상태로 남게되고, 포인트에 대한 계산된 위치는 해당 관측치로부터 도출됩니다.


Trimble 3600/5600 GDM - 개요
Trimble 3600/5600 GDM − 개요

Trimble Geomatics Office와 Trimble 3600/5600 GDM 제어 유니트(Trimble 3600/5600 측량기의) 사이에 서로 데이트를 전송할 수 있습니다. Trimble 사는 이 측량기의 펌웨어 버전이 632.11.00 이상일 것을 권장합니다.

3600/5600 GDM 작업 파일(*.job)과 영역 파일(*.are)로부터 데이터의 가져오기를 할 수 있고, 현재 작업중인 Trimble Geomatics Office 프로젝트로부터 영역 파일(*.are)에 데이터의 내보내기를 할 수 있습니다. 아니면 '측량 장치 가져오기' 옵션을 써서 데이터를 직접 가져오거나 내보내도록 합니다.

다음 표에는 Trimble Geomatics Office와 Trimble 3600/5600 GDM 제어 유니트 사이에 전송 가능한 파일 형식이 나옵니다.

가져오기	내보내기
.작업 − Trimble 3600/5600 GDM 제어 유니트로부터의 수집 데이터	없음
.영역 − 좌표 파일	.are
없음	.pco − Trimble 3600/5600 GDM 제어 유니트에로
없음	.uds − 사용자 정의 순차
가져온 3600/5600 GDM 파일이 Trimble Geomatics Office에서 올바로 해석될 수 있도록 하기 위해서는 다음을 수행하도록 합니다.

  	Trimble 3600/5600 GDM 제어 유니트에 해당 프로그램 번호가 켜져 있는지 확인합니다.

  	수평 거리와 수직 거리보다는 사거리를 저장하고자 하면 Program�32를 설정합니다. 자세한 내용은 Trimble 3600/5600 GDM 제어 유니트 설명서를 참조하십시오.

  	Trimble Geomatics Office에서 Program 23 및 24 관측치를 표시하려면, Trimble 3600/5600 GDM 프로그램 사용자 테이블에서 수평각, 수직각, 사거리 레코드가 표준 레코드들 다음에 반드시 포함되어야 합니다. 사용자 테이블의 수정 방법과 관련, 자세한 사항은 Trimble 3600/5600 GDM 제어 유니트 설명서를 참조하십시오.


사용자 정의 순차(UDS) - 개요
사용자 정의 순차(UDS) − 개요

사용자 정의 순차는 Trimble 3600/5600 측량기의 Trimble 3600/5600 GDM 제어 유니트를 써서 현장에서 측량 데이터를 수집, 저장하는 방법을 결정합니다. 각 순차는 사용자 정의 순차  파일(*.uds)에 저장됩니다.

UDS 파일은 다음과  같은 레코드들로 구성되어야 합니다.

2	측량기 스테이션
3	기계고	(선택 사항)
62	후시점
21	후시 방위각
5	포인트 이름
6	타겟 높이	(선택 사항)
4	코드	(선택 사항)
7	수평각
8	수직각
9	사거리

현장에서 사용자 정의 순차를 쓰려면, 단독형 Data Transfer 유틸리티를 써서 UDS 파일을 Trimble 3600/5600 GDM 제어 유니트에 전송합니다(Trimble Geomatics Office [내보내기] 대화 상자는 쓸 수 없음). 자세한 내용은 Data Transfer 도움말을 참조하십시오.

일단 측량 데이터를 수집, 저장하게 되면 그것을 Trimble Geomatics Office에 전송하십시오.

참조: 사전 정의된 UDS 파일은 Trimble Geomatics Office CD에 들어 있습니다.

기타 참조 사항


Pcode 파일(*.pco)

Pcode 파일은 피쳐 및 속성을 정의하는 숫자 코드와 문자+숫자 설명어가 들어 있는데 Trimble 3600/5600 측량기의 Trimble 3600/5600 GDM 제어 유니트에서 쓰입니다. 현장에서 데이터 수집시 사용자가 코드를 입력함으로써 관측 포인트를 신속하게 정의할 수 있습니다. 이를테면, pcode 파일에 코드 '201'와 설명어 'Tree'가 포함되어 있다면 현장에서 사용자가 코드 '201'을 입력하는 경우, 제어 유니트에 'Tree'가 표시되게 됩니다.

Trimble 3600/5600 GDM 제어 유니트에로 내보내는 Pcode 파일에는 반드시 다음이 포함되어야 합니다.

 256개 미만의 숫자 코드

 문자수가 총 800개를 초과하지 않는 설명어

Pcode 파일을 사용하려면 Trimble의 Feature and Attribute Editor 유틸리티 상에서 피쳐 및 속성 라이브러리로부터 하나를 만든 다음, 이것을 제어 유니트에 전송하도록 합니다.

기타 참조 사항


영역 파일(*.are)

Trimble Geomatics Office는 Trimble 3600/5600 GDM 제어 유니트로부터의 영역 데이터(*.are 파일)를 지원합니다.

자세한 사항은 다음을 참조하십시오.

  Trimble 3600/5600 GDM CU 파일 가져오기, 방법

  Trimble 3600/5600 GDM CU 포맷으로 내보내기, 방법


작업 파일(*.job)

Trimble Geomatics Office는 Trimble 3600/5600 GDM 제어 유니트로부터의 작업 데이터(*.job 파일)를 지원합니다.

자세한 사항은 Trimble 3600/5600 GDM CU 파일 가져오기, 방법을 참조하십시오.


  [측량 보기] 명령

이 명령을 이용하여 프로젝트를 측량 보기 화면에서 봅니다.

이 기능을 이용하려면, 다음 중 하나의 방법을 사용합니다:

  [보기 / 측량] 명령을 선택합니다.

  [측량 보기] 도구를  선택합니다.


측량 보기 - 개요
  측량 보기 − 개요

 기타

프로젝트는 측량 보기 화면이나 평면도 보기 화면에서 볼 수 있습니다.

다음과 같은 측량 관계 태스크를 수행하기 위해서는 측량 보기 화면을 이용합니다:

  GPS 및 비 GPS 관측치 점검

  잘못된 데이터의 보정

몇몇 메뉴 옵션 및 도구 모음은 측량 보기 화면에서만 이용가능 합니다. 이들을 이용해서 기선 처리, 망 조정 등과 같은 측량 관련 태스크를  수행할 수 있습니다.

팁: 프로젝트의 서로 다른 부분을 동시에 보려면 다중 창을 만들면 됩니다. 자세한 사항은 [새 창] 명령을 참조하시기 바랍니다.

측량 데이터 보기

측량 보기 화면에서는 GPS 및 비 GPS 관측치가 선으로 표시됩니다.

관측치를 보려면 등록 정보 창에서 해당 관측치의 선을 더블 클릭하고, 필요하면 관측치의 내용을 편집합니다. 만일 허용 편차 이상의 폐합 오차가 있거나 GPS  관측치가 기각 기준에 해당하면 해당 포인트 혹은 관측치 위에 오류 플래그가 나타납니다.

선의 색상은 서로 다른데 이는 [보기 / 옵션] / [측량범례] 탭에서 설정한 범례 스타일에 의해서 결정됩니다.

'측량 보기' 모드에서 이용 가능한 태스크

다음 태스크들은 측량 보기 화면에서만 이용 할 수 있습니다:

  보기 필터

  관측치의 선택

  GPS 루프 폐합 보고서 옵션

만일 기선 처리 모듈과 망 조정 모듈이 설치되어 있으면 더 많은 측량 관련 태스크를 할 수 있습니다. 다음 테이블은 각각의 모듈에서 이용 할 수 있는 추가 태스크를 보여줍니다.

기선 처리 모듈

망 조정 모듈

보기 화면 변경

언제든지 보기 모드를 변경할 수 있습니다.

평면도 보기 화면으로 전환하려면 다음 중 하나의 방법을 이용합니다.

  [평면도 보기] 도구를 선택합니다.

  [보기 /  평면도] 명령을 실행합니다.


  [평면도 보기] 명령

이 명령을 이용하여 프로젝트를 평면도 보기 화면에서 봅니다.

이 기능을 이용하려면, 다음 중 하나의 방법을 사용합니다.

  [보기 /  평면도] 명령을 실행합니다.

  [평면도 보기] 도구를 선택합니다.


평면도 보기 - 개요
    평면도 보기 − 개요

 기타

프로젝트는 측량 보기 화면이나 평면도 보기 화면에서 볼 수 있습니다.

평면도 보기 화면은 현장 측량 중에 관측된 지형 피쳐를 보고자 할 때 이용합니다.

해당 프로젝트의 모양을 개선하기 위해서 사용자가 포인트, 선, 스타일, 주석 등을 첨가 할 수 있습니다.  평면도 보기 화면에서의 변경은 기초가 되는 측량 관측치에는 영향을 주지 않습니다.

몇몇 메뉴 옵션과 도구 모음은 평면도 보기 화면에서만 이용할 수 있습니다. 이 옵션을 이용해서 CAD 관련 태스크(피쳐 코딩, 레이어 제어, 스타일 관리)를 수행할 수 있습니다.

팁: 프로젝트의 다른 부분을 동시에 보려면  다중 창을 만들면 됩니다. 추가 정보가 필요하면 [새 창] 명령 을 참조하시기 바랍니다.

개체들(포인트, 선, 곡선, 텍스트, 주석)은 주어진 스타일에 따라 표시됩니다.  피쳐 코딩 혹은 등록 정보 창을 이용하여 사용자가 객체의 스타일을 변경할 수 있습니다. GPS 및 광파 관측치는 표시되지 않습니다. 만일 사용자가 평면도 보기 화면에서 선을 추가하면,  데이터베이스에 새로운 객체를 추가하게 되는 것입니다.

사용자가 측량 보기 화면으로 변경을 하면, CAD 선은 표시되지 않습니다.

평면도 보기 화면에서 일단 해당 태스크를 완성하면, 그 평면도를 인쇄하거나 설계 소프트웨어 패키지로 보낼 수 있습니다.

'평면도 보기' 모드에서 이용 가능한 태스크

다음 태스크들은 평면도 보기 화면에서만 이용할 수 있습니다:

  레이어

  스타일(포인트, 선, 텍스트)

  포인트 삽입

  선 작업 삽입

  텍스트 삽입

  주석 삽입

  현재 관측치에 대한  선 작업 삽입

  레이어 기준 선택

  스타일 기준 선택

  종류 기준 선택

  포인트 피쳐 기준 선택

  피쳐 코딩

  DTMLink

  RoadLink

보기 화면 변경

언제든지 보기 모드를 변경할 수 있습니다.

측량 보기 화면으로 전환하려면 다음 중 하나의 방법을 이용합니다.

  [측량 보기] 도구를 선택합니다.

  [보기 / 측량] 명령을 실행합니다.

  <Alt+1>을 누릅니다.


확대 명령
[확대] 명령

그래픽 창의 한 섹션을 확대하기 위해서 이 명령을 이용합니다.

이 기능을 이용하려면, 다음 중  하나의 방법을 사용합니다:

  [보기 / 확대/축소/ 확대]를 선택합니다.

  [확대] 도구 [image] 를 선택 합니다.

만일 줌 내비게이터가 나타나 있으면, 그래픽 창에 보이는 영역이 줌 내비게이터 창에서는 검정색  네모로 표시됩니다.

[확대] 도구를 선택한 후 이를 사용하려면,

1.	포인터를 그래픽 창으로 이동합니다.

플러스 사인을 둘러싼 확대경 포인터가 나타납니다.  확대경 포인터 위에 십자선은 핫 스팟 (hot spot) 을  표시합니다.

2.	다음 중 하나의 방법을 이용합니다.

 그래픽 창에서 해당 위치를 클릭합니다. 핫 스팟을 중심으로 2배 단위로 확대됩니다.

 포인터를 클릭한 후 그래픽 창을 가로 질러 끌면 확대 하고자 하는 영역을 포함하는 네모를 만들 수 있습니다.  영역이 작을수록 확대비율이 커집니다. 마우스 단추를 놓으면 네모 안에 포함된 영역의 내용이 그래픽 창 전체를 차지하게 됩니다. 네모를 그리는 중 [확대] 도구의 현재 작동을  취소하기 위해서는,  마우스 단추를 누른 상태에서 Esc 를 누릅니다.

휠이 있는 마우스는 그 휠을 이용하여 확대 및 축소를 합니다.  휠로 화면을 이동하려면,  그 휠을 누른 상태에서 마우스를 끕니다. 마우스를 이동함에 따라 그래픽 창의 내용도 이동됩니다.


축소 명령
 [축소] 명령

그래픽 창에 표시된 영역을 넓게 하기 위해 이 도구를 이용합니다.

이 기능을 이용하려면 다음 중 하나의 방법을  사용합니다:

  [보기/  확대/축소/ 축소] 명령을 선택합니다.

  [축소] 도구 [image] 를 선택합니다.

만일 줌 내비게이터 가 나타나 있으면, 그래픽 창에 보이는 영역이 줌 내비게이터 창에 검정색 네모로 표시됩니다. 만일 해당 프로젝트 범위 이상으로 축소하면, 줌 네비게이터에 검정색 네모가 표시되지 않습니다.

[축소] 도구를 선택한 이후 이를 이용하려면,

1.	그래픽 창으로 포인터를 이동합니다.

마이너스 사인을 둘러싼 확대경 포인터가 나타납니다. 포인터 위에 십자선이 핫 스팟 (hot spot)을 표시합니다.

2.	다음 중 하나의 방법을 이용합니다.

  그래픽 창의 한 위치를 클릭합니다. 그래픽 창의 배율이 변경되고 해당 핫 스팟의 위치가  중심이 됩니다.

  포인터를 클릭하고 그래픽 창을 가로질러  포인터를 끌어서 사용자가 원하는 영역을 포함한 네모가 만들어지면 마우스 단추를 놓습니다. 그래픽 창의 배율이 변경되고, 이전에 그래픽 창에 보였던 정보가 선택된 네모 영역 안에 표시됩니다. 네모가 작을수록 변경 배율이 큽니다. 네모를 그리는 중 [축소] 도구의 현재 작동을 취소하려면 마우스 단추를 누른 상태에서 Esc를 누릅니다.

휠이 있는 마우스는 그 휠을 이용하여 확대 및 축소를 합니다.  휠로 화면을 이동하려면,  그 휠을 누른 상태에서 마우스를 끕니다. 마우스를 이동함에 따라 그래픽 창의 내용도 이동됩니다.


[전체 보기] 명령

현재 프로젝트에서 볼 수 있는 포인트를 모두 보기 위해서 이 명령을 이용합니다. 사용자가 [전체 보기 ] 명령을 선택하면 그래픽 창이 자동으로 조정되어 모든 데이터를 볼 수 있도록 합니다.

이 기능을 이용하려면, 다음 중 하나의 방법을 사용합니다:

  [보기/ 확대/축소/ 전체] 명령을 선택합니다.

  <Ctrl+E>를 누릅니다.

  [전체 보기 ] 도구 [image] 를 선택합니다.

  그래픽 창에 포인터를  위치시킵니다.  마우스의 오른쪽 단추를 클릭하고, 바로가기 메뉴에서 [전체 보기 ]를 선택합니다.


[직전 배율] 명령

프로젝트를 입력했을 때 각각 직전의 배율 화면으로 되돌아가기 위해 이 명령을 이용합니다.

이 기능을 이용하려면 다음 중 하나의 방법을 사용합니다.

  [보기 /  확대/축소 /  직전 배율]을 선택합니다.

  [직전 배율] 도구 [image] 를 선택합니다.

만일 줌 내비게이터가 표시되어 있으면, 그래픽 창에 보이는 영역이 줌 내비게이터 창에 검정 색 네모로 표시됩니다. 만일 프로젝트  범위 이상 축소하면 줌 네비게이터에 검정색 네모가 표시되지 않습니다.

만일 두개 이상 그래픽 창이 열려있으면, 각 창에 대한 별도의 배율 스택이 저장됩니다.


이동 명령
[이동] 명령

스크린 화면의 서로 다른 영역을 보기 위해 확대/ 축소 영역의 중심을 이동할 때 이 명령을 이용합니다.

이 기능을 이용하려면 다음 중 하나의 방법을 사용합니다.

  [보기 /  이동] 명령을 선택합니다.

  [이동] 도구 [image] 를 선택합니다.

손바닥 모양의 포인터가 나타납니다.

만일 줌 내비게이터가 표시되어 있으면, 그래픽 창에 보이는 영역이 줌 내비게이터 창에 검정 색 네모로 표시됩니다. 만일 해당 프로젝트 범위 이상 이동하면 줌 내비게이터에 검정 색 네모가 표시되지 않습니다.

이동은 배율로써 기억되지 않습니다. 그러므로 이동으로부터  이전의 원래 화면으로 돌아가기 위해  [직전 배율]을 수행 할 수 없습니다.

[이동] 도구를 선택한 후 이를 이용하려면,

1.	포인터를 그래픽 창으로 이동합니다.

포인터 위의 십자선이 핫 스팟(hot spot)을 표시합니다.

2.	포인터를 클릭하고 이동하고자 하는 곳으로 포인터를 끌어 갑니다. 마우스를 이동함에 따라    실 시간으로 그래픽 창의 내용도 이동됩니다.

휠이 있는 마우스는 그 휠을 이용하여 확대 및 축소를 합니다.  휠로 화면을 이동하려면,  그 휠을 누른 상태에서 마우스를 끕니다. 마우스를 이동함에 따라 그래픽 창의 내용도 이동됩니다.


지정 이동 명령
[지정 이동] 명령

그래픽 창 상의 특정 위치로 이동하고 배율을 조정하기 위해 이 명령을 이용합니다. [지정 이동] 대화 상자가 나타납니다.


[지정 이동] 대화 상자

그래픽 창의 특정 위치로 이동하고 배율을 조정하기 위해 이 대화 상자를 이용합니다.

이 기능을 이용하려면, [보기 / 지정 이동] 명령을 선택합니다.

화면 중심

이 필드에 필드 필인(field fill-in) 기능을 이용하여  화면 중심의 이름 혹은 위치를  명시할 수 있습니다.

포인트 이름	데이터 베이스에서  포인트 이름을 명시하기 위해 이 필드를 사용합니다. 만일 사용자가 이 필드에 필드 필인 기능을 이용하면 포인트의 이름, X 좌표, Y 좌표 필드가 자동으로 작성됩니다.
X 좌표/Y 좌표	화면의 중심위치를 정하기 위해 이 필드를 사용합니다. 만일 사용자가 필드 필인 기능을 이용하면, X 좌표와 Y 좌표 필드가 자동으로 작성됩니다.
화면 반경

[화면 반경] 필드는 화면의 범위를 설정합니다. 만일 사용자가 단위를 명시하지 않으면, [프로젝트 등록 정보] 대화 상자의 [단위와 포맷] 탭에 있는 거리 단위 설정이 적용됩니다.


    [필터] 명령

[보기 필터] 대화 상자를 열기 위해 이 명령을 이용합니다.

이 기능을 이용하려면 다음 중 하나의 방법을 사용합니다:

  [보기 /  필터] 명령을 선택합니다.

  [보기 필터] 도구 [image] 를 선택합니다.

  상태 표시줄에서 보기 필터 아이콘 [image] 을 클릭합니다.


    [보기 필터] 대화 상자

측량 보기 화면에서 작업 중 보고 싶지 않은 모든 관측치를 선별 제거하기 위해 이 대화 상자를 이용합니다.

참조: 보기 필터에 의해 감춰진 데이터는 [선택] 메뉴의 어떤 명령을 이용해서도 선택할 수 없습니다.

이 기능을 이용하려면 다음 중 하나의 방법을 사용합니다:

  [보기 /  필터] 명령을 선택합니다.

  [보기 필터] 도구를 선택합니다.

  <Ctrl+F>를 누릅니다.

관측치

이 상자는 보고 싶지 않은 관측치 그룹을 선택하기 위해  이용합니다. 예를 들어, 프로젝트에 RTK 와 광파 관측치 등 여러 종류의 관측치가 있고 그 중에서 RTK관측치만  보고자 할 때  유용합니다.

모든 관측치 표시

프로젝트의 모든 관측치를 보기위해 이 옵션을 선택합니다. 이 옵션은 망 조정 모듈을 설치했을 경우에 나타납니다.

망 조정용으로 마크된 관측치만 표시

[망 조정에 이용] 확인란을 선택한 경우의 관측치 만을 보기위해 이 옵션을 선택합니다. (이 확인란은 등록 정보 창의 요약 페이지에서 이용할 수 있습니다)

이 옵션은 망 조정 모듈이 설치된 경우에 나타납니다. 만일 사용자가 이 옵션을 선택하면, 관측치 그룹의 몇몇 필드는 이용할 수가 없습니다.

망 조정에 이용할 수 있는 관측치만 표시

망 조정 에 이용할 수 있는 관측치만 보기 위해 이 옵션을 선택합니다. 그러나 꼭 [망 조정에 이용] 확인란이 선택되어야 하는 것은 아닙니다. (이 확인란은 등록 정보 창의 요약 페이지에서 이용 할 수 있습니다).

예를 들어, '불이용 상태의' 관측치와 '점검점으로 이용' 관측치는 그들이  망 조정에 이용될 수 있는 경우에 선택될 수 있습니다.

잠재 기선 및 광파 관측치 (이들은 망조정에 이용될 수 없습니다)는 선별 제거됩니다.

참조: 이 옵션은 망 조정 모듈이 설치된 경우에 나타납니다. 만일 사용자가 이 옵션을 선택하면, 관측치 상자에서 몇몇 필드는 이용할 수 없습니다.

표시할 관측치의 종류

[표시할 관측치의 종류] 상자는 다음 확인란들을 가지고 있습니다.

  RTK

  PP Kinematic

  레이저

  델타 표고

  Static

  비 GPS

  축소 변환

  방위각

  미처리 기선

상기 확인란은 사용자가 보기를 원하는 관측치 종류를 선택하기 위해 이용합니다. 예를 들어, RTK 벡터만을 보기위해서는 RTK 확인란만 선택하고 나머지는 선택 해제 합니다.

  사이드샷 관측치

  연속

  불이용 상태의 관측치

  점검 관측치

이 확인란은 선택한 관측치 종류 가운데 어떤 관측치를 보고자 하는지 정하는 것입니다. 위쪽 상자에서는 관측치 종류를, 아래 상자에서는 필터링을 하고자 하는 관측치를 각각 지정합니여야 합니다.

예를 들어, 'RTK 점검 관측치'만 보기 위해서는, 'RTK' 와 '점검 관측치' 확인란을 각각 선택하고 나머지 확인란은 모두 선택 해제 하도록 합니다.

참조: 만일 관측치가 두개 이상의 관측 속성이 있으면 해당 관측치 종류와 관련된 모든 확인란을 선택해야 합니다.

연결되지 않은 포인트 표시

어떤 관측치의 시점이나 종점이 아닌 포인트(예: 키입력 포인트)를 표시하고자 하면 이 확인란을 선택합니다.

이벤트 표시

이벤트를 표시하기 위해 이 확인란을 선택합니다.

선택 집합의 데이터만 표시

사용자가 이전에 선택 집합으로 저장한 데이터를 표시하기 위해 이 확인란을 선택합니다. 목록에서  해당 선택 집합을 선택합니다.

Timeline 을 이용하여 종속 GPS 기선 표시

이 확인란을 선택할 경우, Timeline화면에서 표시되는 관측치만 그래픽 창에 나타납니다.

망 조정을 위해 독립 기선을 선택할 경우에 이 도구를 이용할 수 있습니다.

이 옵션을 켜고 끄기 위해서 도구 모음의 [종속 기선 보기] 단추를 이용합니다.

참조: 이 옵션은 후처리 GPS 데이터에 만 적용됩니다. 모든 다른 데이터는 그래픽 창에 보여지고, 적절한 보기 필터가 적용됩니다.

참조: 이 옵션은 기선 처리 모듈이 설치되어 있는 경우에만 이용할 수 있습니다.

시간

지정한 날짜와 시간의 범위 내에 있는 GPS관측치 만을 표시하기 위해서 이 확인란을 선택합니다. 시간 범위 필드가 활성화됩니다.

시간 범위

Timeline의 시간 측정자로부터 시간을 선택하기 위해서 필드 필인(field fill-in) 기능을 이용하거나, 표시할 GPS 관측치의 날짜 및 시간의 범위를 키보드를 이용하여 입력할 수 있습니다. Julian 날짜를 입력할 수도 있습니다.


포인트 라벨  - 개요
포인트 라벨 − 개요

추가 정보

방법 ...	기타
개요

개체에 대한 정보를 데이터베이스에 저장하지 않고 그래픽 창에 표시하기 위해서 라벨을 이용합니다. 라벨은 측량 보기 화면과 평면도 보기 화면 양쪽에서 다  이용할 수 있습니다.

작업 세션 사이에 프로젝트를 다시 열면 라벨 설정이 다시 복구됩니다. 객체에 대한 정보를 해당 프로젝트 데이터베이스에 저장하기 위해서는 주석을 이용합니다. 평면도 보기 화면에서만 주석을 추가할 수 있습니다.

필드와 사용자가 정의할 수 있는 텍스트를 결합해서 포인트에 라벨을 붙일 수 있습니다. 텍스트 편집기로써  Options.ini  파일을 편집하면 사용자 정의 라벨 옵션을 추가할 수 있습니다.  라벨은 항상 해당 포인트의 우측에 나타납니다.

라벨은 Microsoft Windows 화면 배색 설정의 '도구 설명' 항목에 지정된 글꼴과 크기로 표시됩니다.


[프로젝트 표시줄] 명령

프로젝트 표시줄을 표시하거나 숨기기 위해서 이 명령을 이용합니다.

이 기능을 이용하려면 다음 중 하나의 방법을 사용합니다:

  [보기 / 프로젝트 표시줄] 명령을 선택합니다.

  [프로젝트 표시줄] 도구 [image] 를 선택합니다.


[새로 고침] 명령

화면을 새로 고치기 위해서 이 명령을 이용합니다.

이 기능을 이용하려면 다음 중 하나의 방법을 사용합니다:

  [보기 /  새로 고침] 명령을 선택합니다.

  F5 를 누릅니다.

그래픽 창이 겹쳐 쓰여있어서 읽기가 어려울 때 평면도 화면을 다시 그리기 위해서 이 명령을 선택합니다.


[보기 옵션] 대화 상자

데이터 보기 형식을 사용자가 원하는 모양으로 변경하기 위해서 이 대화 상자를 이용합니다. 이 기능을 이용하려면 [보기 /  옵션]을 선택합니다.

[보기 옵션] 대화 상자에는 다음과 같은 탭이 있습니다:

  그리드 선

  측량 범례

  측량 데이터

  오차 타원 제어

  배경 맵


[보기 옵션] 대화 상자  - [포인트 라벨] 탭
[포인트 라벨] 대화 상자

프로젝트의 포인트 라벨을 표시하기 위해 이 대화 상자를 이용합니다.

이 대화 상자는 메인 메뉴로부터 [보기 / 포인트 라벨] 명령을 선택하여 불러옵니다.

포인트 라벨에 쓸 항목

포인트 라벨에  쓰고자 하는 필드를 선택합니다. Trimble Geomatics Office에는 다음과 같은 옵션이 있습니다. Options.ini 파일을 이용해서 추가한 모든 사용자 정의 라벨 옵션이 이 목록에 나타납니다:

  이름

  피쳐 코드

  표고

  그리드 축척 계수

  표고 축척 계수

  결합 축척 계수

  수렴각

  수평의 질

  표고의 질

  타원체고의 질

적용 대상

가능한 두 가지 옵션:

  선택 부분 - 선택된 포인트에 라벨을 붙이기 위해서 이 옵션을 선택합니다.

  전체 데이터 베이스 - 모든 포인트에 라벨을 붙이기 위해서 이 옵션을 선택합니다. 측량 보기 화면에서 아무것도 선택되지 않으면 이 옵션이 기본으로 선택됩니다.

어떤 선택 부분에 라벨을 붙이면,Trimble Geomatics Office는 라벨이 붙은 포인트들에 대한 명명된 선택 집합을 자동으로 만듭니다.

참조: 한번에 하나의 선택 부분에만 라벨을 붙일 수 있습니다. 만약 사용자가 어떤 포인트들의 선택 부분에 라벨을 붙이고, 새로운 선택 부분에 라벨을 또 붙이면 첫번째 선택 부분에 붙여진 라벨은 취소됩니다.

해제

현재의 모든 라벨을 제거하기 위해서 이 단추를 클릭합니다.

참조: 포인트 라벨을 가진 프로젝트를 다시 열면 라벨 설정이 복구됩니다.

팁: 라벨 텍스트의 폰트와 크기를 변경하려면, Microsoft Windows 표준 창 디스플레이의 '도구 설명' 항목에 대한 설정을 이용합니다.


[보기 옵션] 대화 상자  - [그리드 선] 탭
[보기 옵션] 대화 상자 − [그리드 선] 탭

그래픽 창에 그리드 선을 표시하기 위해서 이 탭을 이용합니다.

이 탭을 이용하려면,

1.	[보기 /  옵션]을 선택합니다. [보기옵션] 대화 상자가 나타납니다.

2.	[그리드 선] 탭을 선택합니다.

그리드 선 표시

그래픽 창에서 그리드 선을 표시하기 위해서 이 확인란을 선택합니다. 그리드 선이 표시되면, 상태 표시줄에 그리드 간격이 표시됩니다.

참조: 도구 모음에서 그리드 선 [image]  단추를 선택해서 그리드 선을 표시할 수도 있습니다.

다음 항목들을 이용할 수 있습니다:

고정 갯수의 그리드 선

스크린에 표시되는 그리드 선의 갯수를 정하기 위해서 이 옵션을 이용합니다. 확대 축소 시에도 같은 갯수의 그리드 선이 표시 됩니다.

참조: 고정갯수의 그리드 선이 스크린의 최단 측면을 따라 표시됩니다.

그리드 간격

그리드 간격을 명시하기 위해서 이 옵션을 이용합니다.  거리 단위는 프로젝트에 명시된 거리 단위 입니다.

참조: 만일 스크린상에 분명히 표시되어야 할 그리드 선이 너무 많으면, 그리드 선이 표시되지 않습니다.

그리드 선 형식

예를 들어 실선 혹은 점선 등의 그리드 선의 스타일을 선택하기 위해서 이 옵션을 선택합니다.

그리드 선 색상

그리드 선의 색상을 선택하기 위해서 이 옵션을 이용합니다. 그래픽 창의 배경 색과의 대조를 이뤄 그리드 선의 색상이 잘 보이도록 하기 위해서 그리드 선의 색을 바꿔야 하는 경우가 있습니다.

그리드 선 라벨 붙이기

그리드 선에 X 좌표 값 과 Y 좌표 값을 가진 라벨을 붙이기 위해서 이 확인란을 선택합니다.

참조: [플롯/인쇄] 명령을 선택하면 그리드 선이 인쇄됩니다.


[보기 옵션] 대화 상자 - [측량 범례] 탭
[보기 옵션] 대화 상자 − [측량 범례] 탭

Trimble Geomatics Office 그래픽 창에 사용자의 프로젝트를 표시하기 위해 이용하는 색상을 변경하고자 하면 이 탭을 이용합니다. 이 탭은 다음 항목들을 결정합니다:

  측량 보기 화면에 서로 다른 관측치 종류와 포인트가 표시되는 방법

  그래픽 창의 배경 색

  텍스트의 기본 색

이 탭을 이용하려면,

1.	보기 /  옵션을 선택합니다. [보기 옵션] 대화 상자가 나타납니다.

2.	[측량 범례] 탭을 선택합니다.

범례 스타일

이 필드에서 '검정' 혹은 '기본'을 선택합니다. 다음 표는 각 옵션에 따른 색상 설정을 설명합니다:


[보기 옵션] 대화 상자  - [측량 데이터] 탭
[보기 옵션] 대화 상자 − [측량 데이터] 탭

이 탭을 이용하여 측량 데이터가 그래픽 창에 표시되는 방식을 변경합니다.

이 탭을 이용하려면,

1.	보기 /  옵션을 선택합니다. [보기 옵션] 대화 상자가 나타납니다.

2.	[측량 데이터] 탭을 선택합니다.

참조: 이 탭은 측량 보기에서만 볼 수 있습니다.

사이드샷에 스텁 선 사용

사이드샷 관측치 벡터를 스텁(stub)으로 표시하기 위해서 이 확인란을 선택합니다.

관측치 갯수 표시(1개 초과시)

다수의 관측 선상에 관측치 갯수를 표시하기 위해 이 확인란을 선택합니다.

관측치를 필터링하는 경우, 전체 관측치 갯수 중 표시되는 관측치 갯수의 비율이 나타납니다. 예: (1/3)


[보기 옵션] 대화 상자 - [오차 타원 제어] 탭
[보기 옵션] 대화 상자 − [오차 타원 제어] 탭

조정이 있은 후에 오차 타원, 타원체고 오차 화살표,  그리고 표고 오차 화살표가 그래픽 창에 나타나도록 할 것인 지를 결정할 경우에 이 탭을 이용합니다. 오차 타원의 축척 및 틱 표의 크기 결정에도 이 탭을 이용할 수 있습니다.

이 탭을 이용하려면,

1.	[보기 /  옵션]을 선택합니다. [보기옵션] 대화 상자가 나타납니다.

2.	[오차 타원 제어] 탭을 선택합니다.

참조: 측량 보기에서만 이 탭을 이용할 수 있습니다.

포인트 오차 타원과 화살표 표시

포인트 오차 타원과 화살표를 표시하기 위해 이 확인란을 선택합니다.

표고 오차 표시

표고 오차를 표시하기 위해 이 확인란을 선택합니다.

타원체고 오차 표시

타원체고 오차를 표시하기 위해 이 확인란을 선택합니다.

오차 타원 배율

아래와 같은 오차 타원 배율 슬라이더는 조정 후에 그래픽 창에 나타나는 오차 타원의 크기를 조절합니다.

타원을 작게 하기 위해서는 슬라이더를 좌측으로 이동합니다. 타원을 크게 하기 위해서는 슬라이더를 우측으로 이동합니다.

틱 표 크기

아래와 같이 그래픽 창에서 오차 타원  표시줄의 스케일에 나타나는 틱 표들 간의 거리를 결정하기 위해 이 필드를 이용합니다.

표시줄의 스케일은 그 크기가 커짐에 따라 길어지게 되는 반면, 틱 표 간의 거리는 [틱 표 크기] 필드에 나타나는 값에 부응해서 변화합니다.


[보기 옵션] 대화 상자  - [배경 맵] 탭
[보기 옵션] 대화 상자 − [배경 맵] 탭

Trimble Geomatics Office는 그래픽 창에 배경 파일을 표시 할  수 있습니다. Drawing Exchange Format (.dxf), Windows Bitmap (.bmp), 혹은 TIFF 포맷 (.tif)  파일과 같은 배경 파일을 가져와서 표시할 수 있습니다.  Windows Bitmap (.bmp), 혹은  TIFF 포맷 (.tif) 파일 들은 정확하게 표시 될 수 있도록 위치가 참조 되어야 합니다.

ESRI's World 파일 포맷은 배경 파일의 위치참조를 위해서 이용합니다.  World 파일은 .tfw 또는 .wld 의 확장자를 가진 ASCII 텍스트 파일입니다. World파일이 Trimble Geomatics Office에 사용되기 위해서는 다음 사항을 충족해야 합니다.

  관련.dxf, .bmp 또는.tif 파일과 같은 위치에 저장되어 있어야 합니다.

  Trimble Geomatics Office 프로젝트와 같은 좌표계를 가지고 있어야 합니다.

  Trimble Geomatics Office 프로젝트와 같은 단위를 가지고 있어야 합니다.

참조:Trimble Geomatics Office는 압축되지 않은 TIFF파일들을 지원하고, 또한 CCITT, PackBits, Thunder, Next, LogLuv과 같은 압축 스킴을 지원합니다. 그러나 다음과 같은 압축 파일들은 지원하지 않습니다: OJPEG, JPEG, ZIP, LZW, PixarLog.

참조: Trimble Geomatics Office는 RLE 압축된 .bmp 파일을 지원하지 않습니다.

표시할 배경 파일을 선택하기 위해서 [배경 맵] 탭을 이용합니다.

이 탭을 이용하려면,

1.	[보기 /  옵션]을 선택합니다. [보기옵션] 대화 상자가 나타납니다.

2.	[배경 맵] 탭을 선택합니다.

파일 이름

이 상자는 배경 맵용으로 선택된 파일의 목록을 표시합니다.

추가

배경 파일을 선택하기 위해서 이 단추를 이용합니다. .dxf, .bmp, 또는 .tif 파일을 선택할 수 있습니다.

참조: 관련 World 파일이 같은 위치에 저장되어 있어야 합니다. 목록에서 이 파일을 선택할 필요는 없습니다.

제거

목록에서 배경 파일을 제거하기 위해서 이 단추를 단추를 이용합니다.

World 파일 포맷

아래에 World 파일 포맷의 일례를  보여줍니다.

20.17541308822119

0.00000000000000

0.00000000000000

−20.17541308822119

424178.11472601280548

4313415.90726399607956

위 6개 값은 다음 형태의6개 매개변수 결합 변환을 이용하여 이미지-대-world 변환을 계산하는데 이용됩니다.

x1 = Ax + By + C

y1 = Dx + Ey + F

여기에서,

x1 	지도상의 계산된 화소의 x-좌표

y1 	calculated y-coordinate of the pixel on the map

y1 	지도상의 계산된 화소의 y-좌표

x 	이미지 내 한 화소의 열 갯수

y 	이미지 내 화소의 줄 갯수

A 	x-축척; x 방향 맵 단위 화소 치수

B, D	회전 항

C, F	평행이동 항; 좌측 상단 화소 중심의 x,y 맵 좌표

E 	y-축척 음수; y 방향 맵 단위 화소의 치수

변환 매개 변수는 World 파일에 다음 순서로 저장됩니다:

20.17541308822119 − A

0.00000000000000 − D

0.00000000000000 − B

-20.17541308822119 − E

424178.11472601280548 − C

4313415.90726399607956 − F

참조: Trimble Geomatics Office는 이미지를 회전을 지원하지 않습니다. 만일 사용자의 World 파일이 비 제로(non-zero) 회전 조건 ( D와 B 매개변수)을 가지면, 이 조건들은 사용되지 않습니다.

참조: x-축척(A)이나 y-축척(E)의 사인은 좌표계 배향의 여하에 따라 달라집니다. 이는 이미지와 지리 좌표계의 원점이 서로 다르기 때문입니다. 지리 좌표계의 원점은 좌표 방향에 따라 변하지만 이미지의 원점은 항시 좌측 상단 코너에 있습니다.

예를 들어, NE 좌표계에 있어 맵 좌표계 원점은 좌하단 코너에 위치해 있습니다. 맵의 y-좌표 값은 좌하단 코너에서 위로 증가하는 반면,  이미지의 횡열값은 좌상단 코너로부터 아래로 증가합니다. 따라서 NE 좌표계의 경우, y-축척(E)은 음수입니다. 다음은 NE, SE & NW 좌표계에서 사용하여야 하는 x-축척과 y-축척의 사인에 대한 요약표입니다.

	NE	SW	NW
x(A)	+ve	-ve	-ve
y(E)	-ve	+ve	-ve