Copyright: © 1999-2002 Trimble Navigation Limited
Citation: © 1999-2002 Trimble Navigation Limited


Ajuste de Rede - Índice
    Ajuste de Rede – Índice

Estes tópicos estão disponíveis:

  Ajuste de rede

  Datum de ajuste

  Estilos de ajuste de rede

  Pontos

  Observações

  Grupos de observação

  Estratégias de ponderação

  Ajuste

  Coordenadas de calibração

  Remover ajuste

  Relatório de ajuste de rede

Para aprender como usar a Ajuda, pressione a tecla F1.

Se você tiver um problema e não puder encontrar a informação que você precisa neste sistema de Ajuda, procure no Trimble Geomatics Office − Guia do Usuário de Ajuste de rede, contate seu revendedor local, ou veja Suporte Técnico.

©1999−2002, Trimble Navigation Limited. Todos os direitos reservados.


    Ajuste de Rede - Perspectiva geral

Mais informações

 Veja também

Perspectiva geral

O propósito de executar um ajuste quadrados-mínimos de sua rede é para:

  estimar e remover erros aleatórios

  fornecer uma única solução onde houver dados redundantes

  minimizar correções feitas às observações

  detectar erros e erros grandes

  gerar informações para análise, incluindo estimativas de precisão

Após completar o ajuste de quadrados-mínimos exitosamente, você irá determinar que:

  não há erros e erros sistemáticos nas observações e pontos de controle

  quaisquer erros remanescentes são pequenos, aleatórios, e adequadamente distribuídos

Um ajuste de quadrados-mínimos assegura bons fechamentos de posição e estimativas de repetibilidade; portanto, assegura a confiabilidade de suas medições atuais e futuras.

Para completar um ajuste bem feito, uma rede de quadrados-mínimos deve adequar-se a este critério:

  A rede deve fechar geométrica e matematicamente.

  A soma dos quadrados ponderados dos residuais deve ser minimizada.

Fechar a rede geometricamente simplesmente significa desenhar sua rede usando geometria boa, fechada. Uma rede GPS ou terrestre consiste de uma série de observações entre pontos de rede. Estas observações criam figuras geométricas fechadas, como triângulos por exemplo.

Fechar a rede matematicamente simplesmente significa que você eliminou todos os erros grandes ou erros de suas observações, portanto assegurando resultados estatísticos aceitáveis.

Mantendo os quadrados ponderados e um mínimo refere-se a fechar a rede matematicamente dizendo que você deve minimizar a soma de quadrados ponderados de residuais de suas observações. Simplesmente ponha, conforme você ajustar cada uma de suas observações, o ajuste total de todas as suas observações (quadradas), deve estar no valor mais baixo possível.

O software Trimble Geomatics Office testa este critério para você e informa-o sobre quaisquer observações ou pontos de controle que evitam o ajuste de rede de adequar-se ao critério.

Quando e Por quê Ajustar uma Rede

Comece seu ajuste de rede após o seguinte:

  processamento de linha de base GPS (processando seus dados GPS não processados)

  Importar suas linhas de base RTK (com dados QC1 & QC2) e/ou dados terrestres

  Remover sinalizadores de erro criados desde erros fora-da-tolerância

SUGESTÃO: Trimble firmemente recomenda que você leia o Apêndice A, Um Guia para Ajustes de Quadrados Mínimos no Trimble Geomatics Office − Guia do Usuário de Ajuste de rede antes de começar um ajuste.

NOTA: Você completou ou importou (de um arquivo DC) uma Calibração de Local GPS antes de executar um ajuste de rede, será pedido para você aceitar a remoção da Calibração de Local GPS (parâmetros) antes de iniciar um ajuste de rede. O software Trimble Geomatics Office não irá permitir que você tenha parâmetros de transformação de um ajuste de rede e parâmetros de calibração de uma Calibração de Local GPS em um projeto; você pode ter um ou o outro, mas não ambos.

Procedimentos de Ajuste de rede

Os dois principais procedimentos de ajuste de rede incluem:

1.	Comece com um ajuste minimamente limitado (ou um ajuste livre quando limitações internas forem usadas) para ajustar e executar uma verificação de controle de qualidade de suas observações. Este passo:

  verifica a consistência interna de sua rede

  detecta erros ou observações de mal adequadas

  obtém estimativas de erro de observação precisas

2.	Executa um ajuste totalmente limitado. Este passo:

  referencia a rede para controle existente (datum)

  verifica controle existente

  produz parâmetros de transformação de rede

  obtém estimativas de erro de coordenada precisas

Para informações sobre executar um ajuste com uma combinação de observações GPS e terrestre, veja o tópico Para executar um tópico de ajuste combinado.

NOTA: Após completar um ajuste minimamente limitado de observações GPS no datum WGS-84, você pode salvar as coordenadas WGS-84 dos pontos ajustados. Estas coordenadas WGS-84 são salvadas para uso como pontos GPS em uma Calibração de Local GPS. Após gerar coordenadas de grid locais em um ajuste totalmente limitado para uso como pontos grid em calibração, você pode executar uma calibração para uso à campo (Piquetagem). Será pedido a você para aceitar a remoção dos parâmetros de transformação de ajuste antes de iniciar uma Calibração de Local GPS. Assegure-se de que você tenha completado o ajuste de rede antes de começar sua Calibração de Local GPS. Para mais informações, veja Calibração de Local GPS.

NOTA: Se você pretende executar um ajuste de rede usando dados transferidos do software Trimble Survey Controller, assegure-se de digitar uma pressão, temperatura, e curvatura e correção de refração no seu estilo de levantamento de survey controller survey quando estiver executando um levantamento.


    Datum - Perspectiva geral

Mais informações

Como ...	Veja também
Perspectiva geral

De maneira geral, um datum é uma moldura de referência usada para determinar coordenadas para pontos na superfície da terra. Vários datums locais são usados por todo o mundo para definir coordenadas de uma área local. Há também datums mundiais usados para definir coordenadas ao redor do mundo. Normalmente, os pontos de controle conhecidos que você usa em seus levantamentos são baseados em um sistema de coordenadas local usando um dos datums locais. Quando estiver coletando observações GPS à campo, as observações são referenciadas a um datum mundial conhecido como WGS-84.

Quando você criou seu projeto e definiu suas propriedades de projeto no software Trimble Geomatics Office, você deveria ter selecionado um sistema de coordenadas de projeto referenciado a um datum local em particular (datum de projeto). O sistema de coordenadas de coordenadas do projeto, jutno com o datum, é usado para gerar coordenadas para todos os pontos no projeto.

Antes de executar um ajuste de rede, você pode selecionar o datum usado para os passos de ajuste minimamente limitado e totalmente limitado. Para os propósitos desta discussão, isto é chamado um datum de ajuste. Você pode selecionar o WGS-84 ou o datum de projeto como o datum de ajuste. A seleção de um datum de ajuste aplica-se somente ao ajuste.

Se você está executando um ajuste minimamente limitado de observações GPS, use o datum WGS84 datum; o datum usado pelo Global Positioning System. Usando um datum que não o WGS-84 faz o ajuste aplicar mais ou menos residual para cada observação, compensando para diferenças na moldura de referência.

Você deve selecionar o datum correto para cada passo de ajuste; isto é:

  Selecione o datum WGS-84 antes de executar o passo ajuste minimamente limitado com Dados GPS.

  Selecione o datum do projeto antes de executar um ajuste minimamente limitado com dados terrestres. (Se o datum selecionado para o ajuste minimamente limitado não é o datum do projeto, o datum do projeto é selecionado antes de executar um ajuste totalmente limitado.)

NOTA: WGS-84 pode ser usado como o datum do projeto. Alguns levantamentos usam pontos de controle referenciados a um sistema de coordenadas usando WGS-84 como seu datum. Neste caso, a seleção de um datum para os passos de ajuste minimamente limitado e totalmente limitado são um e o mesmo.

NOTA: O sumário de coordenadas de Grid e Local na janela de propriedades são sempre exibidas usando o sistema de coordenadas selecionado para o projeto. Selecionar WGS-84 como seu datum de ajuste não tem nenhum efeito na exibição de coordenada de grid e local.

Para mais informações, veja Selecionando um Datum.


    WGS-84 Datum

Mais informações

Como ...	Veja também
Perspectiva geral

Se você está executando um ajuste minimamente limitado de observações GPS, use o datum WGS-84 (o datum usado pelo Global Positioning System).

Se você não usar o datum WGS-84 quando estiver ajustando linhas de base GPS, o ajuste produz resultados de ponderação diferentes. Isto é porque diferenças de datum são gravadas nas observações durante o processo de modelagem de linha de base.

Para mais informações, veja Selecionando um Datum.


    Datum de Projeto

Mais informações

Como ...	Veja também
Perspectiva geral

O Datum do projeto é selecionado da guia Sistema de coordenadas do diálogo de Propriedades do Projeto.

Após executar um ajuste minimamente limitado inicial, selecione o Datum do projeto como o datum de ajuste.

O passo de ajuste totalmente limitado aplica os parâmetros de transformação requeridos para:

  referenciar suas observações GPS (WGS-84) ao seu sistema de coordenadas local (Datum do projeto).

  transformar observações terrestres para que se ajustem em seu controle de local.

Durante este passo de ajuste, você pode limitar pontos de controle em referência ao datum do projeto, efetivamente transformando suas observações referenciadas a WGS-84 para seu datum do projeto selecionado.

Para mais informações, veja Selecionando um Datum.


    Grupos de Observação - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

O software de ajuste de rede deixa você separar conjuntos de observações em grupos. Você pode criar esses tipos de grupos:

  Grupos de variância

  Grupos de transformação

Separar observações em grupos permite que você avalie melhor os erros em cada tipo de observação.

Grupos de variância

Com levantamentos, há freqüentemente grupos variados de medições usados em uma única rede. O ajuste deve ter uma forma de considerar os diferentes erros associados com essas medições GPS. No software Trimble Geomatics Office, grupos de variância possibilitam separar essas observações em grupos.

  É fácil ver que quanto mais preciso o método de levantamento, menores os erros de medições.

O processador de ajuste determina um fator de referência de referência separado e graus de liberdade para cada grupo. Isto mostra de que forma cada grupo contribui para o ajuste de rede geral. Cada grupo pode ser escalado individualmente usando a opção Grupos de variância para o controle Aplicar Escalares a no diálogo Estratégias de ponderação.

Por padrão as observações GPS, terrestre, e geóide são automaticamente separadas em grupos de variância (os grupos <GPS Padrão>, <Terr. Padrão> e <Geoid padrão>).

NOTA: O grupo <Geoid padrão> irá sempre ser o único grupo de variância geóide disponível em qualquer ajuste de rede. Já que o mesmo método é usado para interpolar para cada observação geóide do mesmo modelo geóide, não há nenhuma necessidade de separá-los em grupos múltiplos.

NOTA: Se você tem observações sobre linhas muito curtas (< 25 metros), a Trimble recomenda que você crie um grupo de variância separado para essas observações de forma que elas sejam escaladas separadamente.

Grupos de Transformação

Grupos de Transformação são seleções de observações, coletivamente subjugados à mesma transformação ou conjunto de transformações durante um ajuste. Cada grupo de transformação tem um conjunto de parâmetros de transformação que pode ser aplicado individualmente ou em conjuntos para transformar as observações dentro de um grupo de transformação.

Você pode controlar as transformações aplicadas a cada grupo definindo um ou mais dos parâmetros de transformação. Se você somente estiver interessado em aplicar transformações aos parâmetros de desvio, você pode configurar o Status de cada parâmetro de transformação de desvio para Computado e deixar os outros parâmetros configurados para Não usados.

Por padrão, esses parâmetros de transformação são configurados para Computado para grupos de transformação de observações GPS:

   Desvio de longitude

   Desvio de latitude

   Rotação de azimute

   Escala de rede

Por padrão, apenas a Rotação de azimute é configurada para observações terrestres. Outros parâmetros podem ser configurados para definido-por-usuário ou computado, mas eles são somente usados quando um erro sistemático está nas observações. Por exemplo, quando um ajuste é executado e todas as distâncias (medidas por técnicas terrestres) têm um residual +3 ppm, um parâmetro de escala de distância pode ser computado porque há um erro sistemático na coleção de dados. Esse erro sistemático pode ser causado pela configuração ppm no EDM não sendo aplicado.

NOTA: O software Trimble Geomatics Office deixa você digitar parâmetros de transformação definidos-por-usuário. A Trimble recomenda que você tenha um completo entendimento de parâmetros de transformação antes de tentar definir Valores digitados manualmente para quaisquer parâmetros.

Para mais informações sobre Parâmetros de transformação, veja o tópico Parâmetros de transformação - Perspectiva geral.


    Relatório de Ajuste de rede - Perspectiva geral

Mais informações

Veja também	Diálogo
Perspectiva geral

Use este relatório para visualizar as mensagens e estatísticas geradas durante um ajuste de rede.

Para visualizar o Relatório de ajuste de rede:

  Selecione Relatórios / Relatório de ajuste de rede.

O visualizador HTML padrão para seu computador inicia e o Relatório de ajuste de rede aparece.

Uma vez que o relatório apareça, você pode usar os comandos de visualizador HTML para navegar para essas seções:

  Configurações de estilo de ajuste

  Tolerâncias residuais

  Exibição de covariância

  Controles Terrestres

  Erros de Configuração

  Sumário Estatístico

  Número de Iterações

  Estatísticas Globais

  Estatísticas de Observação GPS

  Estatísticas de Modelo Geóide

  Estatísticas de Observação Terrestre

  Estratégias de ponderação

  Coordenadas Ajustadas

  Coordenadas de Grid

  Coordenadas Geodéticas

  Deltas de Coordenada

  Comparações de Coordenada de Controle

  Observações Ajustadas

  Observações GPS

  Observações Geóides

  Observações Terrestres

  Histogramas para Residuais Padronizadas

  Elipses de Erro de Ponto

  Valores de Covariante

Instruções para avaliar estatísticas de relatório são incluídas com os tópicos listados acima.

NOTA: Você pode selecionar observações de erro na visualização do levantamento selecionando-as no Relatório de ajuste de rede. Para fazer isso, selecione o ID de observação do Relatório de ajuste de rede (para selecionar observações múltiplas, use a tecla Ctrl). A seleção atual na visualização do Levantamento é desmarcada e substituída pelas observações selecionadas no relatório.


    Ajuste - Perspectiva geral

Mais informações

Como ...	Veja também
Perspectiva geral

Use o comando Ajuste para começar o processo ajuste.

Para começar um ajuste, faça um dentre os seguintes:

  Desde o menu de visualização do Levantamento, selecione Ajuste / Ajustar.

  Pressione F10.

  Na barra de projeto, selecione grupo Ajustar, e clique no ícone Ajustar.

Todas as iterações de ajuste são executadas automaticamente uma vez que o processo inicie. Use a barra de status para monitorar o status do ajuste de rede; mensagens aparecem conforme cada iteração de ajuste é executada.

No máximo, o processador de ajuste executa o máximo número de iterações definidas no estilo de ajuste. Durante cada iteração, o residual de cada observação é testado para determinar se ele equipara-se com a tolerância definida no estilo de ajuste. O processo de ajuste termina em poucas iterações se a rede convergir antes que o número máximo de iterações passe.

Uma vez que os residuais das observações passem o critério do teste de aceitação, a rede converge e essas funções são executadas:

  Os valores ajustados para cada ponto no ajuste de rede são salvados ao projeto como os valores de coordenada atual com qualidades de ponto de Ajustado.

  Um sub-registro de coordenada adicional é criado para cada ponto no ajuste. O tipo de sub-registro é baseado no seguinte critério

  Se um ponto é fixado no ajuste e não importado usando uma Folha de Dados NGS ou como um ponto de controle em um arquivo ASCII, um sub-registro digitado com Office é também salvado.

  Valores de ajuste para cada ponto no ajuste de rede tornam-se o valor de coordenada com uma qualidade de ponto de ajustado. A coordenada do ponto limitado e a qualidade do ponto (controle) permanece como previamente digitada.

  Na Janela de propriedades, uma página de coordenada de ajuste é criada para cada ponto no ajuste. A todos os componentes ilimitados do ponto são designados uma qualidade de ponto de Ajuste. Quaisquer componentes limitados são Nulos.

  Uma recomputar é automaticamente executada. Uma recomputação irá determinar novas coordenadas para todos os pontos não-rede. As coordenadas novas são computadas usando as observações não-rede, propagando das coordenadas ajustadas (e fixadas).

  O símbolo para os pontos ajustados muda para círculos amarelos sólidos.

  Elipses de erro e setas são geradas para cada ponto no ajuste.

  Todos os outros pontos no ajuste de rede são salvados.

  Os símbolos para a mudança de pontos ajustados; círculos amarelos sólidos aparecem quando a janela de gráficos tem um fundo preto e círculos azuis sólidos com fundo padrão.

  Elipses de Erro são geradas para cada ponto ajustado no ajuste (não para pontos horizontais fixos).

Os valores ajustados estão disponíveis para visualização na página de propriedades para cada ponto. Se a opção de exibição de Elipse de Erro estiver ligada, as elipses são exibidas em cada ponto ajustado na janela de gráficos.

Agora você pode começar a analisar os resultados do ajuste de rede visualizando o Relatório de ajuste de rede.


    Estratégias de Ponderação - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Estratégias de ponderação deixam você definir o método para aplicar pesos e escala para cada tipo de obervação; GPS, terrestre, e geóide. O software Trimble Geomatics Office deixa você definir estratégias de ponderação separadas para cada tipo de observação.

É importante ponderar cada observação baseado em seu tipo e qualidade de observação. Isto permite que o ajuste escale adequadamente cada estimativa de erro a prior da observação. Quando definirestratégias de ponderação, você pode aplicar um escalar para estas observações:

  Todas as Observações

  Cada Observação

  Grupos de variância

Normalmente você irá aplicar o tipo escalar a todas as observações ou grupos de variância, dependendo dos métodos usados durante o levantamento. Quando você configura Aplicar escalar à opção para cada observação, a opção tipo de escalar definido-por-usuário é desativada. Aplicar o escalar para cada observação é normalmente usado somente para análise de propósitos. Aplicar para cada observação pode ajudar a encontrar uma observação individual que esteja criando problemas e seu ajuste de rede.

Uma vez que um método para aplicar um valor escalar seja selecionado, você pode definir o tipo de escalar usado no ajuste. Esses tipos de escalar podem ser selecionados:

  Padrão

  Alternativo

  Definido-por-usuário

  Automático

Em alguns ajustes, as estimativas de erro a priori computadas para um grupo de observações pode estar subestimada. Usar a estratégia de ponderação correta permite que você escale as estimativas a priori, portanto estimando os erros corretos para todas as observações.

Quando começar um ajuste, a estratégia de ponderação padrão é configurada como Aplicar o tipo escalar Padrão para todas as observações. O escalar padrão simplesmente multiplica o erro a priori por 1.00, deixando as estimativas de erros sem mudanças.

Se o erro estimado em suas observações iguala-se ao erro verdadeiro, o fator de referência relatado deve ser aproximadamente 1.00. Uma vez que o ajuste é executado, você pode descobrir que o fator de referência não é próximo a 1.00, indicando que alguma graduação é necessária para igualar o erro estimado ao erro verdadeiro. A forma mais simples de aplicar o escalar é selecionar o tipo de escalar alternativo. O tipo de escalar alternativo usa o fator de referência do ajuste atual, multiplicado pelo escalar prévio, para determinar o escalar para o próximo ajuste. Isso efetivamente traz o fator de referência para próximo a 1.00. O Escalar Alternativo é aplicado a sucessivos ajustes até que o fator de referência seja aproximadamente 1.00 e passe o teste de Quiquadrado. A opção de tipo escalar automático automatiza este processo.

NOTA: O fator de referência do primeiro ajuste deve ser um valor aceitável antes de usar o tipo escalar alternativo. Normalmente um alto fator de referência indica a presença de um erro grande no ajuste. Verifique para erros (isto é, observações com residuais altos) antes de começar o próximo ajuste. Aplicar um tipo de escalar alternativo a um ajuste com alto fator de referência faz o escalar aumentar para um valor inaceitável.

Uma vez que o fator de referência seja aceitável e passe o teste de Quiquadrado, você pode trancar o último escalar computado. Trancar o escalar automaticamente configura o Tipo de Escalar para definido-por-usuário.

CUIDADO: Tenha cuidado quando selecionar o tipo de escalar definido-por-usuário e digitar valores de escalar. Antes de usar tipo de escalar definido-por-usuário, você deve ter um entendimento completo de estimativas de erro, estratégias de ponderação, e escalares.


    Comandos - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Todos os comandos necessários para executar um ajuste de rede estão localizados no menu de Ajuste. O comando para gerar um Relatório de ajuste de rede está no menu Relatórios. Os comandos de ajuste de rede são listados na ordem geral que você vai ver para executar os passos de um ajuste. Use os comandos de ajuste de rede para ajudar a guiá-lo através de um ajuste de sua rede.

Esses comandos estão disponíveis no menu de Ajuste:

  Datum

  WGS-84 (Datum)

  Datum do projeto

  Estilos de Ajuste

  Pontos

  Observações

  Grupos de observação

  Grupos de transformação

  Grupos de variância

  Estratégias de ponderação

  Ajustar

  Coordenadas de calibração

  Salvar (Coordenadas de calibração)

  Remover (Coordenadas de calibração)

  Remover ajuste

Este comando está disponível no submenu Visualizar / Barras de Ferramenta:

  Controles de Elipse

NOTA: Selecionar o comando Elipses de Erro é o mesmo que selecionar a caixa de verificação Mostrar elipses & setas de erro de ponto no diálogo Visualizar Opções − guia Controles de Elipse de Erro.

Esses comandos estão disponíveis na barra de ferramentas Controles de Elipse:

  Elipses de erro

  Erros de altura

  Erros de elevação

Esse comando está disponível no menu de Relatório:

  Relatório de ajuste de rede

Esse comando está disponível no diálogo Observações:

  Desativar Observações

NOTA: O comando Desativar Observações é equivalente a mudar o estado de uma observação para Desativada desde a Janela de propriedades. Observações desativadas somente podem ser reativadas desde a Janela de propriedades. Para mais informações, veja Desativando Observações e Reativando Observações Desativadas.


    Parâmetros de transformação - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Transformações são computadas e aplicadas durante o passo de ajuste totalmente limitado, baseadas nas configurações parâmetro de transformação selecionadas para grupos de transformação individuais.

Cada grupo de transformação inclui observações GPS, terrestres, ou geóides e um conjunto associado de configurações de parâmetro de transformação que, se computado, pode ser aplicado para observações de grupo de transformação.

Cada grupo de transformação tem sete parâmetros. Estes sete parâmetros de transformação cada um inclui um campo Valor que pode ser opcionalmente usado para definir o valor de parâmetro de transformação aplicado durante um ajuste totalmente limitado. Cada campo de Valore tem uma configuração de Status associada que determina se o valor no campo Valor é indefinido, computado, ou definido-por-usuário.

Esses sete parâmetros estão disponíveis:

  Desvio de longitude

  Desvio de latitude

  Rotação de azimute

  Escala de rede

  Escala de Distância

  Constante de Distância

  Constante de Altura

Os primeiros quatro parâmetros são geralmente usados para transformações de datum, como por exemplo transformar o datum WGS-84 para um datum de projeto (local). As deflexões controlam o declive no horizontalizado, a rotação de azimute é aplicada a azimutes, e a escala de rede é aplicada a todas as observações lineares (distância e altura).

Os três parâmetros restantes são geralmente usados para solucionar para possíveis erros sistemáticos em um grupo de observações.

Por padrão, esses parâmetros de transformação são configurados para Computados para grupos de transformação de observações GPS:

   Desvio de longitude

   Desvio de latitude

   Rotação de azimute

   Escala de rede

Por padrão, apenas a rotação de azimute é configurada para Computada para observações terrestres. Outros parâmetros podem ser configurados para definido-por-usuário ou computado, mas eles são usados apenas quando houver um erro sistemático nas observações. Por exemplo, quando um ajuste é executado e todas as distâncias (medidas por técnicas terrestres) tiverem um residual de +3ppm, um parâmetro de escala de distância pode ser computado porque há um erro sistemático na coleta de dados. Este erro sistemático pode ser causado pela configuração ppm no EDM que não é aplicado.

NOTA: A rotação de azimute, escala de rede, escala de distância, e parâmetros constantes de distância não são usados para transformações geóides.

Configurando o status de um parâmetro para computado não significa que o parâmetro é computado e aplicado durante o passo de ajuste totalmente limitado. O software avalia o número de limitações na rede, e determina se a quantidade requerida de limitações está disponível para computar um parâmetro. Por exemplo, deflexões requerem fixar pelo menos três coordenadas verticais na rede. Se houver menos de três coordenadas verticais mantidas fixas, os parâmetros de desvio não são computados ou aplicados.

A configuração de status definido-por-usuário permite que você predefinir quaisquer ou todas as transformações, as quais são aplicadas a um grupo de transformação. Se o status é configurado para definido-por-usuário, o valor digitado é aplicado à observação, e não é computado durante o ajuste.

NOTA: Apesar de que o software Trimble Geomatics Office deixa você digitar parâmetros de transformação definidos-por-usuário, você deve ter um completo entendimento de parâmetros de transformação antes de tentar definir qualquer parâmetro de transformação.

Quando um Relatório de ajuste de rede é gerado, o status de um parâmetro dita como o valor é relatado. Um ou todos os seguintes é gerado:

  Se o status de qualquer parâmetro foi configurado para não usado, o valor de parâmetro não é relatado nas seções Observações Ajustadas do relatório.

  Se o status de qualquer parâmetro foi configurado para computado e o ajuste não pôde computar um valor de parâmetro devido a limitações insuficientes, nenhum valor de parâmetro é incluído nas seções de Observações Ajustadas do relatório. Uma vez que um ajuste pode computar os parâmetros, o valor de parâmetro é incluído nas seções de Observações Ajustadas do relatório.

  Se o status de qualquer parâmetro é configurado para definido-por-usuário, o valor de parâmetro digitado é relatado, independentemente do número de limitações.

SUGESTÃO: Você também pode visualizar os parâmetros de transformação desde a guia Ajuste da guia de propriedades detalhadas do Sistema de coordenadas na Janela de propriedades do Projeto.

NOTA: A observação observada é exibida na Janela de propriedades quando uma observação estiver sendo selecionada. A observação ajustada ou transformada não está disponível para visualização na Janela de propriedades.

Para mais informações, veja Definindo Parâmetros de transformação.


    Coordenadas de Calibração

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Salvar coordenadas de calibração permite que você armazene coordenadas GPS no datum WGS-84 para um ponto. Estas coordenadas são salvadas após completar um ajuste minimamente limitado. Após completar o ajuste totalmente limitado no datum local, você então pode salvar coordenadas de grid para o ponto.

NOTA: A opção Salvar coordenadas de calibração somente está disponível se o datum de ajuste é configurado para WGS-84, e apenas observações GPS foram ajustadas.

Esses dois métodos estão disponíveis para criar coordenadas de calibração:

  Pontos Existentes

  Pontos novos com sufixo

Salvar coordenadas para grupo de calibração inclui essas opções:

Pontos Existentes

Se você escolher salvar as coordenadas em pontos existentes, as coordenadas são salvadas no registro de ponto correspondente. Essas coordenadas somente são usadas para posicionar o ponto se outros dados de levantamento não estão disponíveis. Eles são salvados para calibração apenas.

Se os pontos são salvados em pontos existentes, a lista Ponto no diálogo Calibração de Local GPS é automaticamente preenchida.

Pontos Novos com Sufixo

Se você escolher salvar as coordenadas em Pontos Novos com sufixo: GPS, um ponto novo é criado com o nome de ponto  "<Nome do Ponto>-GPS". Essas coordenadas somente são usadas para posicionar o ponto se outros dados de levantamento não estiverem disponíveis. Eles são salvados para calibração apenas.

Use essa opção para manter os pontos GPS e de grid para uma Calibração de Local GPS como entidades separadas.

Visualizando Coordenadas de calibração

Uma vez que coordenadas de calibração são salvadas no projeto, você pode visualizar as propriedades dos pontos de calibração na Janela de propriedades.

Removendo Coordenadas de calibração

Você também pode remover coordenadas de calibração. O comando Coordenadas de calibração no menu de Ajuste exibe um submenu com um comando Remover para remover as coordenadas de calibração do projeto.


    Página de Coordenadas Gerada pelo Ajuste de Rede

Mais informações

 Veja também

Perspectiva geral

Quando você executar um ajuste de rede, coordenadas ajustadas são geradas para cada ponto não limitado no ajuste. Você pode visualizar as coordenadas ajustadas na Janela de propriedades.

As coordenadas ajustadas são geradas no datum atual de ajuste. Por exemplo:

  Se o ajuste de rede é executado no datum WGS-84, uma coordenada WGS-84 de ajuste é criada.

  Se o ajuste de rede é executado no datum do projeto, uma coordenada de grid de ajuste é criada.

NOTA: Uma qualidade de controle fixa é dada a coordenadas que foram fixadas no diálogo Pontos.

 Você não pode editar essas coordenadas.

Coordenadas de qualidade Ajustada são usadas antes de coordenadas de controle não fixadas. Elas são removidas antes de mais ajustes, e quando o ajuste é removido.


A importância de Homogeneização de Coordenadas em Ajustes de Rede

Antes que você ajuste dados em seu projeto Trimble Geomatics Office, você deve importar pontos de controle de boa qualidade. Isso é porque após você importar seus dados no software, você necessita executar uma recomputação para determinar a posição calculada dos pontos importados, e o software usa os pontos de controle para seus cálculos.

Coordenadas com semente mal feita podem conduzir a graduação imprópria de observações durante a modelagem de linha de base, o que então causa resultados errados desde o ajuste de rede. Erros de coordenada vertical produzem erros de graduação durante a modelagem.

Para prevenir coordenadas de má qualidade de passarem o ajuste, assegure-se de que:

  as observações sejam de uma coordenadas de alta qualidade

  os dados sejam homogêneos; isto é, não há grandes erros de fechamento nos dados

Se você tentar executar um ajuste enquanto erros de fechamento existirem em seu projeto, o diálogo aviso de dados Não-homogêneos aparece. Remova não-homegeneidades antes de proceder com seu ajuste minimamente limitado.

NOTA: É apenas durante um ajuste com escalares padrão que o software verifica não-homogeneidade. Se você editar dados e pretender executar outro ajuste, assegure-se de que a opção escalar Padrão ( nas guias GPS, Terrestre, e Geóide) no diálogo Estratégias de ponderação está configurada.


Mensagens de erro de falha no ajuste

Perspectiva geral

As seguintes mensagens de erro podem aparecer quando um ajuste estiver sendo executado:

  Ajuste falhou − Sem convergência

  Ajuste falhou − Instabilidade de coordenada horizontal ou vertical

  Ajuste falhou − Instabilidade de transformação

Todos os três erros podem ocorrer durante um ajuste, por diversas razões. Use as mensagens para identificar pontos de problema no seu ajuste, e quando investigar seus dados.

Ajuste falhou − Sem convergência

Um ajuste está completo quando as coordenadas de ponto ajustado não mudam de uma iteração de ajuste para a próxima. Essa mensagem aparece quando as coordenadas para os pontos no ajuste estiverem mudando mais do que as tolerâncias residuais. Um erro pode existir nos dados o que faz com que o ajuste não converja. Por exemplo:

  As coordenadas não ajustadas para um ponto podem não estar próximas aos valores ajustados.

  Pode haver um erro em uma observação (por exemplo, um azimute observado pode ser incorreto por 180 graus).

Você precisa assegurar-se de que todos os erros sejam removidos antes de um ajuste.

Essa mensagem pode também ser causada por ângulos no ajuste que tenham distâncias observadas mais curtas que 25 metros. Eleve a "Tolerância Residual para Iterações Finais" para um valor que acomode as coordenadas sendo mudadas (1.0 e-3 m).

Ajuste falhou − Instabilidade de coordenada Horizontal ou vertical

Essa mensagem é causada por um erro matemático durante o ajuste de computações.

A mensagem diz a você se o problema é uma coordenada horizontal ou vertical, e identifica o ponto que causou o erro. Examine sua rede, identifique o ponto de problema, e investigue seus dados.

Ajuste falhou − Instabilidade de transformação

Essa mensagem é causada por um erro matemático durante o ajuste de computações. A mensagem diz a você qual parâmetro causou o problema, e o nome do grupo de transformação.

Essa mensagem pode aparecer se a porção GPS de uma rede não estiver totalmente integrada em uma porção terrestre. Por exemplo, isso pode ocorrer em uma rede combinada de observações GPS e terrestres quando a parte terrestre da rede consistir de dois ou mais segmentos não conectados um ao outro. Para mais informações, veja o tópico Para combinar tipos diferentes de observação em um ajuste de rede.

Assegure-se de que suficientes observações existam para atar as observações GPS e terrestre juntas e/ou desligar as transformações GPS. Alternativamente, solucione o problema limitando as coordenadas para um ponto que é diretamente conectado à porção GPS da rede.


    Diálogo de Estilos de Ajuste de Rede - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este diálogo para selecionar, criar, copiar, editar, renomear, e apagar estilos de ajuste. O estilo atual é chamado de estilo ativo. As configurações definidas para o estilo ativo são sempre aplicadas ao ajuste seguinte.

Você pode criar uma biblioteca de estilos para executar tipos diferentes de ajustes e compartilhá-los entre projetos múltiplos.

Para visualizar o Diálogo de estilos de ajuste de rede:

  Selecione ajuste / Estilos de ajuste.

Estas opções estão disponíveis:

Estilo ativo

Use este campo para identificar o estilo ativo atual para o ajuste de rede. Novos estilos ativos são selecionados desde a lista de estilos e aparecem neste campo. Este campo é para propósitos de exibição apenas e não pode ser editado.

Lista de estilos

Selecione o estilo ativo desta lista. Uma vez que um estilo esteja ativo, um dos botões do lado direito do diálogo podem ser selecionados para editar, copiar, renomear, ou apagar o estilo.

Se você selecionar um estilo e clicar em OK, o estilo torna-se o estilo ativo para o ajuste.

O software Trimble Geomatics Office vem com vários estilos de ajuste pré-definidos. Você pode copiá-los e usá-los como base para criar novos estilos, ou você pode criar seus próprios novos estilos. Qualquer estilo de ajuste pode ser editado.

Os estilos nesta lista não salvados no projeto mas são armazenados no Windows Registry onde eles podem ser usados para projetos múltiplos.

Editar

Clique neste botão para visualizar ou editar estilos. Em selecionando este botão, o estilo selecionado desde a lista de estilos torna-se o estilo ativo, e o diálogo Editar estilo de ajuste aparece com opções para editar o estilo de ajuste.

Novo

Clique neste botão para criar um novo estilo de ajuste. Quando você clicar neste botão o diálogo Novo estilo aparece.

Após dar um nome ao novo estilo, o estilo torna-se o estilo ativo, e o diálogo Editar estilo de ajuste aparece com opções para editar o estilo de ajuste. Para mais informações, veja Criando estilos.

NOTA: O estilo  ‘95% Limites de Confidência’ é usado como o estilo padrão quando novos estilos estiverem sendo criados.

Copiar

Clique neste botão para copiar o estilo ativo e usá-lo como uma fonte para criar um novo estilo de ajuste. Quando você clicar neste botão, a cópia do estilo tona-se o estilo ativo, e o diálogo Copiar Estilo aparece.

Após dar um nome ao novo estilo, o diálogo Editar estilo de ajuste aparece com opções para editar o estilo de ajuste. Para mais informações, veja Copiando Estilos.

Renomear

Clique neste botão para exibir o diálogo Renomear Estilo. Use o Nomear campo para digitar o nome do novo estilo. Quando você clicar OK, o nome do estilo no Windows Registry é renomeado, o estilo torna-se o estilo ativo, e o nome novo aparece no campo Estilos ativos. Para mais informações, veja Renomear Estilos.

Apagar

Clique neste botão para apagar o estilo ativo. Estilos apagados são permanentemente removidos do Windows Registry e não ficam mais disponíveis. Para mais informações, veja Apagando Estilos.


    Diálogo Editar Estilo de Ajuste - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Visualize este diálogo quando você quiser visualizar ou editar o estilo de ajuste ativo.

Para visualizar o diálogo Editar Estilos de ajuste:

1.	Para visualizar o diálogo Estilos de ajuste de rede, selecione ajuste / Estilos de ajuste.	O diálogo Estilos de ajuste de rede aparece.

2.	Selecione um estilo desde uma lista de estilos.

Clique em Editar.

O diálogo Editar Estilos de ajuste aparece.

As seguintes guias estão disponíveis:

Geral

Selecione esta guia para visualizar ou editar as tolerâncias residuais, escalares sigma, e propriedades gerais para um estilo de ajuste. Para mais informações, veja Geral.

Exibição de Covariância

Selecione esta guia para visualizar ou editar as opções de exibição de covariância bi e tridimensional para o estilo de ajuste. Para mais informações, veja Exibição de Covariância.

Controles Terrestres

Selecione esta guia para visualizar ou editar as configurações de erro padrão, e para selecionar qual tipo de ajuste (horizontal, vertical ou ambos) é executado. Para mais informações, veja Controles Terrestres.

Erros de Configuração

Selecione esta guia para visualizar ou editar erros em altura de antena, centralização de antena, altura de instrumento, e centralização de instrumento (sondagem). Estas definições serão aplicadas globalmente para todas as observações para compensar para erros quando ajustes estiverem sendo computados. Para mais informações, veja Erros de Configuração.


    Diálogo Editar Estilo de Ajuste - guia Geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use esta guia para definir as tolerâncias residuais, escalares sigma, e propriedades gerais para um estilo de ajuste.

Para visualizar a guia Geral do diálogo Editar Estilo de ajuste:

1.	Para visualizar o Diálogo de estilos de ajuste de rede, selecione ajuste / Estilos de ajuste. O diálogo Estilos de ajuste de rede aparece.

2.	Selecione um estilo desde uma lista de estilos.

3.	Clique em Editar. O diálogo Editar Estilos de ajuste aparece.

4.	Selecione a guia geral.

Estas opções estão disponíveis:

Use Perfil de Coluna Reduzida

Selecione esta caixa de seleção para reduzir a quantidade de memória de computador requerida para ajustar uma rede. Para redes grandes, esta opção diminui a quantidade de tempo requerida para completar um ajuste.

NOTA: Esta opção usa uma combinação de algoritmos desenvolvidos pelo U.S. National Geodetic Survey (NGS).

Usar esta opção não produz nenhum efeito em seus resultados de ajuste, com exceção de não permitir a exibição de Termos de covariante entre pontos não conectados por observações.

Quando estiver usando esta opção, você deve Fixar pelo menos um ponto de controle horizontal e um ponto de controle vertical.

Se você executar um ajuste livre (sem coordenadas fixadas), então você não pode usar a opção Use perfil de coluna reduzida. Para ajustes livres Mudar a guia geral do diálogo Estilos de ajuste é ignorado e o ajuste procede sem usar perfis de coluna reduzidas.

Restringir Termos de covariante para Linhas Observadas

Selecione esta caixa de seleção para limitar a exibição de termos de covariante. Quando esta opção é selecionada, não há efeito nos resultados de ajuste finais, com exceção de prevenir a exibição de termos de covariante entre pontos não conectados por observações.

Quando a caixa de seleção é desmarcada, os termos de covariante são computados entre todas as permutações possíveis de pares de ponto na rede. Para redes grandes, a lista de termos de covariante no Relatório de ajuste pode tornar-se muito longa.

Computar Correlações para Modelo Geoidal

Quando você estiver usando observações geoidais em um ajuste, mantenha as coordenadas verticais (altura e elevação) fixadas, de forma que uma solução sobredeterminada possa existir e uma residual de geóide possa ser calculada para pontos limitados.

Quando a caixa de seleção Computar correlações para um modelo geoidal é selecionada, residuais de geóide são calculadas para pontos com coordenadas verticais ilimitadas, usando correlações de modelo de geóide entre os pontos.

Quando a caixa de seleção for desmarcada, residuais somente são computadas para pontos com alturas e elevações fixadas.

Tolerâncias residuais

Use estas opções para controlar as tolerâncias de residuais usadas durante o processo de ajuste de rede. Para mais informações, veja Tolerâncias residuais.

Escalares Sigma

Selecione uma opção da lista para configurar escalares sigma uni e bidimensionais. Para mais informações, veja Escalares Sigma.

Iterações Máximas

Digite o máximo número de iterações permitido quando o ajuste tenta convergir a rede. O padrão de Iterações Máximas é 10.


    Tolerâncias residuais

Mais informações

 Veja também

Perspectiva geral

Estas opções controlam as tolerâncias residuais usadas durante o ajuste de rede. O Ajuste de rede é um processo iterativo. Cada iteração de ajuste é verificada para convergência baseado nessas tolerâncias residuais:

Para Terminar Iterações

Digite a tolerância de residual usada para determinar se iterações de ajuste devem continuar ou parar.

Após cada iteração de ajuste, uma residual de observação é computada usando duas rotinas de software diferentes. A diferença entre as duas computações é comparada à Tolerância de iterações To End. Baseado nessa comparação, uma dentre as seguintes ações acontece:

  Se a diferença entre as residuais de observação computadas for menor que a Tolerância de iterações Para fim, as iterações de ajuste param. Uma mensagem é incluída no Relatório de ajuste de rede declarando Ajuste bem feito em # iterações, onde ## é o número de iterações requeridas para convergir a rede.

  Se a diferença entre as residuais de observação computadas for maior que a Tolerância de iterações Para fim, as iterações de ajuste continuam. Se o ajuste continua até atingir as Iterações Máximas, a Interrupção da Convergência Final é usada (veja abaixo).

Interrupção da convergência final

Digite a tolerância de interrupção da convergência para a iteração final do ajuste da rede. O software usa este valor para determinar se o ajuste de rede foi bem feito quando a iteração final não passa a Tolerância de iterações Para fim.

Se a diferença computada na residual da observação para a última iteração de ajuste for maior que a Tolerância de iterações Para fim, a residual é comparada à Interrupção da convergência final e uma das seguintes ações acontece:

  Se a diferença entre a residual da observação computada for menor que a Interrupção da convergência final, o ajuste é bem feito e uma mensagem é exibida declarando ‘Convergência Final bem feita após ## iterações (interrupção da convergência final usada)’, onde ## é o número de iterações requeridas para convergir a rede.

  Se a residual da observação for maior que a Interrupção da convergência final, o ajuste falha e um diálogo de aviso aparece dizendo Ajuste falhado. Sem Convergência.

Essas mensagens são também escritas no Relatório de ajuste de rede.

O valor digitado no campo Iterações Máximas determina quando a interação final ocorre. Seja cauteloso quando estiver fazendo mudanças no número de iterações ou nas tolerâncias de Iterações Para fim e de Interrupção da convergência final.


    Escalares Sigma

Mais informações

 Veja também

Perspectiva geral

Estas opções configuram as escalares sigma unidimensionais e bidimensionais.

Escalares sigma de uma só dimensão são aplicadas a todos os erros de uma dimensão, erros propagados em observações, componentes de coordenada, e precisão horizontal. Escalares sigma bidimensionais são aplicados a todas as elipses de erro de duas dimensões.

Por padrão, todos os erros propagados são exibidos em erro padrão 2-sigma, equivalendo a um nível de confiança de 95% para ambas as escalares sigma uni e bidimensionais.

Estas opções estão disponíveis:

Unidimensional

Use esta lista para selecionar a escalar sigma unidimensional aplicada para todos os erros propagados em observações, componentes de coordenadas e precisão horizontal. Esses são todos erros de uma dimensão.

Para os métodos US, Bomford e Esférico, estas opções estão disponíveis:

  1.000 (68%)

  1.646 (90%)

  1.960 (95%)

  2.575 (99%)

Bidimensional

Use esta lista para selecionar a escalar bidimensional aplicada para todas as elipses de erro. As elipses de erro são exibições gráficas de erros de duas dimensões.

Estas opções estão disponíveis:

  1.000 (39%)

  2.147 (68%)

  2.447 (95%)

  3.035 (99%)


    Diálogo Editar ajuste do estilo - guia Exibir Covariância

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use esta guia para definir opções de exibição de covariância bi e tridimensional para o estilo de ajuste de rede.

Para visualizar a guia Exibir Covariância do Diálogo editar estilo de ajuste:

1.	Para acessar o diálogo de estilos de ajuste de rede, selecione ajuste / Estilos de ajuste. O diálogo Estilos de ajuste de rede aparece.

2.	Selecione um estilo da lista de estilos.

3.	Clique em Editar. O diálogo Editar Estilos de ajuste aparece.

4.	Selecione a guia Exibir Covariância. As opções de Exibição de Covariância aparecem.

Estas opções estão disponíveis:

Horizontal

Use estas opções para definir as opções de exibição de covariância bidimensional para o estilo de ajuste de rede. Para mais informações, veja Horizontal.

Tridimensional

Use estas opções para definir as opções de exibição de covariância tridimensional para o ajuste. Para mais informações, veja Tridimensional.


    Horizontal (Exibição de Covariância)

Mais informações

 Veja também

Perspectiva geral

Estas opções definem opções de exibição de covariância bidimensional para o ajuste:

Expressar Precisão Como

Use esta lista para definir o método de expressar precisão (P) horizontal (2D) como erros proporcionais. Para precisão horizontal, distância é a distância horizontal entre pontos.

Selecione uma destas opções:

  PPM − Selecione esta opção para expressar precisão horizontal em unidades de X partes por milhão, onde X = distância × P × 1.0e-06).

  Índice − Selecione esta opção para expressar precisão horizontal em unidades de uma parte em X (onde X = distância ÷ P).

  Nenhum − Selecione esta opção para desativar a exibição de precisão horizontal.

NOTA: Precisão é calculada usando a seguinte fórmula:

 (E x S)2 = C2 + P2

onde:

E é o Erro Linear Propagado

S é a escalar em Erro Linear Propagado

C é o termo de erro constante

P é a Precisão

Erro Linear Propagado

Use esta lista para definir o erro linear propagado horizontal (bidimensional) para o estilo de ajuste de rede. O erro linear propagado computado está em 1-sigma, independentemente das Escalares Sigma unidimensional e bidimensional.

Selecione uma destas opções:

  US − Selecione esta opção para usar o erro padrão de distância horizontal ajustada (2D) ou de declive (3D).

  Canadense − Selecione esta opção para usar o maior eixo semi-maior do elipsóide de erro relativo de 2D ou 3D.

  Bomford − Selecione esta opção para usar a raiz quadrada da soma de variâncias de erro relativo de 2D ou 3D.

  Esférico − Selecione esta opção para usar a média dos erros padrões relativos de 2D ou 3D.

Termo Constante

O Termo Constante deve ser especificado nas unidades de projeto configuradas nas propriedades de projeto. O termo deve situar-se entre 0.0 m (0.0 usft) e 0.1 m (0.3 usft).

Escalar em Erro Linear

Use esta lista para definir o escalar horizontal (bidimensional) para precisão de escala para o nível de confiança desejado. Para escalar matrizes de covariância relativas, o erro linear propagado é elevado ao quadrado.

Para os métodos US, Bomford, e Esférico, selecione uma destas opções:

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

Para o método Canadense, selecione uma destas opções:

  1.000 (39%)

  2.147 (90%)

  2.447 (95%)

  3.035 (99%)


    Tridimensional (Exibição de Covariância)

Mais informações

 Veja também

Perspectiva geral

Estas opções definem opções de exibição de covariância tridimensional para o ajuste:

Expresse Precisão Como

Selecione o método de expressar precisão (P) tridimensional (3D) como erros proporcionais. Para precisão tridimensional, a distância é a distância de declive entre pontos.

Selecione uma destas opções:

  PPM − Selecione esta opção para expressar precisão horizontal em unidades de X partes por milhão, onde X = distância × P × 1.0e-06).

  Índice − Selecione esta opção para expressar precisão horizontal em unidades de uma parte em X (onde X = distância ÷ P).

  Nenhum − Selecione esta opção para desativar a exibição da precisão horizontal.

NOTA: A Precisão é calculada usando a seguinte fórmula:

 (E x S)2 = C2 + P2

onde:

E é o Erro Linear Propagado

S é a escalar no Erro Linear Propagado

C é o termo de erro constante

P é a Precisão

Erro Linear Propagado

Use esta lista para definir o erro linear propagado tridimensional para o estilo de ajuste de rede.

O erro linear propagado computado está em 1-sigma, independentemente dos valores especificados para os Escalares Sigma uni e bidimensionais.

Selecione uma destas opções:

  US − Selecione esta opção para usar o erro padrão de erro ajustado (horizontal (2D) ou declive (3D)).

  Canadense - Selecione esta opção para usar o maior eixo semi-maior do elipse de erro relativo de 2D ou 3D.

  Bomford − Selecione esta opção para usar a raiz quadrada da soma das variâncias de erro relativo de 2D ou 3D.

  Esférico − Selecione esta opção para usar a média dos erros padrões relativos de 2D ou 3D.

Termo Constante

O Termo Constante deve ser especificado nas unidades de projeto configuradas nas propriedades do projeto. O termo deve variar entre 0.0 m (0.0 usft) e 0.1 m (0.3 usft).

  Escalar em Erro Linear

Use esta lista para selecionar a escalar tridimensional para precessões escalares para o nível de confiança desejado. Para escalar matrizes de covariância relativas, o erro linear propagado é elevado ao quadrado.

Para os métodos US, Bomford, e Esférico, selecione uma destas opções:

  1.000 (68%)

  1.646 (90%)

  1.969 (95%)

  2.575 (99%)

Para o método Canadense, selecione uma destas opções:

  1.00 (20%)

  2.50 (90%)

  2.80 (95%)

  3.37 (99%)

Use Erros de Elevação se Disponíveis

Use esta caixa de seleção para determinar se erros de elevação ou erros de altura de elipsóide disponíveis são aplicados quando computando precisão tridimensional (3D).

Selecione esta caixa de seleção para computar precisão tridimensional usando erros de elevação, ou desmarque esta caixa de seleção para aplicar erros de altura de elipsóide em computações de precisão tridimensional.

Quando esta caixa de seleção está selecionada, erros de elevação somente são aplicados para a computação quando as observações geoidais são carregadas, permitindo que você compute elevações. Por padrão, esta caixa de seleção é marcada. Deixe esta caixa de seleção selecionada se você estiver confiante na qualidade dos  pontos  de controle verticais fixados e do modelo geoidal selecionado.

Erros de altura de elipsóide são usados e o estado da configuração desta opção é ignorado em computações de precisão tridimensional quando nenhum modelo geoidal é selecionado nas propriedades do projeto.


    Editar diálogo de Estilo de Ajuste - guia Erros de Configuração

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este estilo para definir erros conhecidos em altura de antena, centralização de antena, altura de instrumento, e centralização de instrumento (sondagem). Estas definições serão aplicadas globalmente a todas as observações para compensar erros quando ajustes de rede estiverem sendo computados.

Para visualizar a guia Erros de Configuração do diálogo Editar Propriedades de Ajuste:

1.	Para acessar o diálogo de estilos de ajuste de rede, selecione ajuste / Estilos de ajuste. O diálogo Estilos de ajuste de rede aparece.

2.	Selecione um estilo da lista de estilos.

3.	Clique em Editar. O diálogo Editar Estilos de ajuste aparece.

4.	Selecione a guia Erros de Configuração.

No grupo GPS, as seguintes opções estão disponíveis:

Erro na Altura da Antena

Use este campo para definir o erro estimado na altura da antena. O erro estimado é aplicado globalmente a todas as observações GPS quando o ajuste de rede estiver sendo computado.

O erro estimado é baseado no tipo de ferramenta de medida e na habilidade de ler a medida. Se uma fita métrica é usada para medir a altura da antena, as estimativas de erro permitidas são um pouco mais altas que aquelas de uma mira de medição de altura. Uma mira é uma ferramenta mais rígida para medir altura, ao contrário da fita métrica flexível.

Erros estimados na altura da antena normalmente variam entre 0.000 e 0.004 mm (0.000 e 0.013 sft). O padrão é 0.000 m (0.000 sft).

Erro de Centralização

Use este campo para definir o erro estimado na centralização quando sondagem e nivelando uma antena sobre o ponto do levantamento.

O erro estimado é aplicado globalmente a todas as observações GPS quando o ajuste de rede estiver sendo computado. O erro estimado é influenciado por como os tribrachs são mantidos e como eles são centralizados sobre o ponto de levantamento.

Erros de centralização normalmente variam entre 0.000 e 0.002 m (0.002 e 0.007 sft). O padrão é 0.000 m (0.000 sft).

No grupo Terrestre, as seguintes opções estão disponíveis:

Erro na Altura do Instrumento

Use este campo para definir o erro estimado na altura de instrumento ou altura alvo. O erro estimado é aplicado globalmente a todas as observações terrestres quando o ajuste de rede é computado.

O erro estimado é baseado no tipo de ferramenta de medida e na habilidade de ler a medida. Erros estimados em altura de instrumento normalmente variam entre 0.000 e 0.004 m (0.000 to 0.013 sft). O padrão é 0.000 m (0.000 sft).

Erro de Centralização

Use este campo para definir o erro estimado na centralização quando sondagem e nivelando um instrumento ou alvo sobre os pontos de levantamento.

O erro estimado é aplicado globalmente a todas as observações terrestres quando o ajuste de rede é computado. O erro estimado é influenciado por como os tribrachs são mantidos e como eles são centralizados sobre o ponto de levantamento.

Erros de centralização normalmente variam entre 0.000 e 0.002 m (0.002 e 0.007 sft). O padrão é 0.000 m (0.000 sft).


    Diálogo Novo Estilo

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este diálogo para criar um novo estilo de ajuste de rede.

Para visualizar o Diálogo novo estilo:

1.	Para acessar o diálogo de estilos de ajuste de rede, selecione ajuste / Estilos de ajuste. O diálogo Estilos de ajuste de rede aparece.

2.	Clique em Novo. O novo estilo torna-se o estilo ativo, e o diálogo Novo estilo aparece.

Uma opção está disponível:

Nome

Selecione este campo para digitar o nome do novo estilo de ajuste de rede. O nome pode incluir até 255 caracteres, mas nomes mais curtos são mais fáceis para encontrar em uma lista de estilos. Clique em OK após nomear o estilo para visualizar o diálogo Editar estilo de ajuste. Você pode usar este diálogo para editar os controles de estilo.


    Diálogo Copiar Estilo

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este diálogo para criar um novo estilo de ajuste de rede baseado em uma cópia de outro estilo de ajuste de rede.

Para visualizar o diálogo Estilo de Cópia:

1.	Para acessar o diálogo estilos de ajuste de rede, selecione ajuste / Estilos de ajuste. O diálogo Estilos de ajuste de rede aparece.

2.	Selecione um estilo existente para copiar de uma lista de estilos.

Clique em Copiar.

O estilo copiado torna-se o estilo ativo, e o diálogo Copiar estilo aparece.

Uma opção está disponível:

Nome

Selecione este campo para digitar o nome para o novo estilo de ajuste de rede. Uma cópia do arquivo selecionado de uma lista de estilos será criado usando o novo nome. O nome pode incluir até 255 caracteres, mas nomes mais curtos são mais fáceis para encontrar em uma lista de estilos. Clique em OK após nomear o estilo para visualizar Editar estilo de ajuste. Você pode usar este diálogo para mudar os controles de estilo de ajuste.


    Diálogo Renomear Estilo

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este diálogo para renomear um estilo de ajuste de rede.

Para visualizar o diálogo Renomear Estilo:

1.	Para acessar o diálogo de estilos de ajuste de rede, selecione ajuste / Estilos de ajuste. O diálogo Estilos de ajuste de rede aparece.

2.	Selecione um estilo de uma lista de estilos para renomear.

Clique em Renomear

O diálogo Renomear Estilo aparece.

Uma opção está disponível:

Nome

Digite o novo nome para o estilo de ajuste de rede neste campo. O nome pode incluir até 255 caracteres, mas nomes curtos e descritivos são mais fáceis de encontrar em uma lista de estilos.


Diálogo Editar Estilo de Ajuste - guia Controles Terrestres

Mais informações

 Diálogo

Perspectiva geral

Use este estilo de ajuste para definir estimativas e controles de erro terrestre. Estas colunas estão disponíveis:

Coluna	O que mostra
Medições	As medições terrestres disponíveis. Estas incluem:   Ângulos horizontais    Distâncias de Declive   Ângulos Verticais   Elevações Delta   Leitura da Mira de Nivelamento   Separações Geoidais   Azimutes
Erros padrões	Os erros padrões que são usados quando erros padrões não são fornecidos com a observação.
Erros padrões mínimos-absolutos	Os erros padrões mínimos-absolutos. Estes erros são usados quando eles são maiores que os erros padrões fornecidos.
Erros padrões mínimos proporcionais	Os erros padrões mínimos proporcionais. Estes erros são usados quando a soma do componente de erro absoluto e do componente de erro proporcional é maior que os erros padrões fornecidos. NOTA: Um erro proporcional somente existe para distâncias de declive.
Selecione uma dentre as seguintes caixas de verificação para especificar o tipo de ajuste a ser executado nas observações terrestres:

  Executar ajuste vertical

  Executar ajuste horizontal


Para adicionar observações do grupo de transformação

 Perspectiva geral e Mais informações

Observações podem ser adicionadas a um grupo de transformação definido pelo usuário a qualquer momento. Observações também podem ser removidas quando não sejam mais necessárias.

SUGESTÃO: Clique Filtrar para exibir o diálogo Filtro da Observação com opções para a filtração de tipos na lista de Observações disponíveis.

SUGESTÃO: As colunas também podem ser movidas para outros lugares, seus tamanhos podem ser modificados para exibir mais ou menos informações e podem ser classificadas em ordem crescente ou decrescente.

Para adicionar observações:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação Groups.

2.	Selecione a guia GPS, Terrestre ou Geóide.

NOTA: Não pode-se editar o grupo de transformação padrão do Geóide.

3.	Selecione o grupo de Transformação.

4.	Clique Editar. Aparece o diálogo Editar grupo de transformação com as observações do grupo selecionado exibidas na lista de Observações do grupo.

5.	Selecione uma observação da lista de Observações disponíveis.

6.	Clique Adicionar. A observação é adicionada à lista de Observações do grupo.

7.	Clique OK. As mudanças são salvadas.


Para adicionar variâncias do grupo

 Perspectiva geral e Mais informações

Observações podem ser adicionadas a um grupo de variância a qualquer momento. Observações também podem ser removidas quando não são mais necessárias.

SUGESTÃO: Clique Filtrar para exibir o diálogo Filtro da Observação com as opções para a filtração de tipos de observação na lista de Observações disponíveis.

SUGESTÃO: As colunas também podem ser movidas para outros lugares, seus tamanhos podem ser modificados para exibir mais ou menos informações e podem ser classificadas em ordem crescente ou decrescente.

Para adicionar observações:

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS, Terrestre ou Geóide.

NOTA: Não pode-se editar o grupo de variância padrão do Geóide.

3.	Selecione o grupo desejado.

4.	Clique Editar. Aparece o diálogo Editar grupo de variância. A lista do Grupo de observações do grupo selecionado exibidas na lista de Observações do grupo exibe as observações atuais do grupo e a lista de Observações disponíveis exibe todas as observações ativadas do projeto.

5.	Clique na observação da lista de Observações disponíveis que deseja adicionar ao grupo.

6.	Clique Adicionar. A observação é adicionada à lista de Observações do grupo e removida do grupo Observações disponíveis.

7.	Clique OK. As mudanças são salvadas.


Para aplicar estratégias de ponderação

 Perspectiva geral e Mais informações

Estratégias de ponderação podem ser aplicadas à próxima iteração de um ajuste.

Para aplicar estratégias de ponderação:

1.	Selecione Ajuste / Estratégias de ponderação. Aparece o diálogo Estratégias de ponderação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Edite as estratégias de ponderação.

4.	Clique Editar. A nova estratégia de ponderação será aplicada à próxima iteração do ajuste.

5.	Clique OK. O diálogo fecha.


Para mudar o valor do parâmetro da transformação

 Perspectiva geral e Mais informações

CUIDADO: Tenha extremo cuidado ao mudar campos de valor do parâmetro de transformação. Antes de tentar efetuar tais mudanças, requer-se um sólido conhecimento da teoria do ajuste da rede e de ajustes de quadrados mínimos.

NOTA: Os parâmetros da Rotação do azimute, Escala da rede, Escala da distância e Constante da distância não são usados para transformações do geóide. Estes campos são observações GPS e terrestres editáveis.

Para mudar um valor de parâmetro:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo desejado.

4.	Clique Editar. Aparece o diálogo Editar grupo de transformação.

5.	Selecione o campo Valor para o parâmetro de transformação desejado.

6.	Insira o novo valor do parâmetro.

Considere os seguintes princípios gerais:

  Valores angulares são inseridos como DDD.MMSSssss com sinal.

  Valores lineares são inseridos nas unidades do projeto com sinal.

Princípios gerais para a mudança de Valor e Status de parâmetros individuais de transformação podem ser encontrados nos seguintes tópicos:

  Desvio de longitude

  Desvio de latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

7.	Selecione a opção Definido pelo usuário na lista de Status. Para maiores informações, selecione um dos tópicos listados acima.

8.	Repita os passos de 1 a 7 para mudar os valores adicionais do parâmetro de transformação, se necessário. Talvez seja necessário mudar os campos Valor e Status de vários parâmetros para criar a transformação desejada.

9.	Clique OK.

As mudanças são aplicadas ao grupo de transformação.


Para limpar o status fixo de pontos para remover restrições do componente da coordenada

As configurações do Status Fixo usadas para restringir pontos individuais para um componente de coordenada da lista de Pontos pode ser limpado seletivamente.

Para limpar as configurações do Status Fixo:

1.	Selecione Ajuste / Pontos. Aparece o diálogo Pontos.

2.	Use a barra de rolagem para encontrar o ponto desejado.

3.	Selecione o ponto.

4.	No grupo da opção Fixo, limpe as marcas aplicáveis para remover as restrições do componente.

Clique OK.

As mudanças são aplicadas ao projeto.


Para copiar estilos de ajuste da rede

Estilos existentes podem ser copiados para criar um novo estilo. As configurações do ajuste da rede definidos para o novo estilo serão idênticas ao estilo original. Uma vez que o estilo seja copiado, as configuração do ajuste podem ser personalizadas.

Para copiar um estilo:

1.	Selecione Ajuste / Estilos do ajuste. Aparece o diálogo Estilos do ajuste da rede.

2.	Clique Copiar. Aparece o diálogo Copiar estilo.

3.	Digite o nome do novo estilo no campo Nome.

4.	Clique OK. Aparece o diálogo Editar estilo do ajuste.

5.	Edite as configurações do estilo.

6.	Clique OK. O novo estilo é salvado.


Para criar estilos de ajuste da rede

Novos estilos de ajuste da rede podem ser criados em duas maneiras. Este tópico mostra como criar novos estilos com base nas configurações do Estilo do ajuste no estilo de 95% dos Limites de confidência. Um segundo tópico é disponível para cópia de um estilo existente para um estilo novo.

SUGESTÃO: O novo estilo pode ser editado para ajustar com precisão as configurações de acordo com as suas necessidades, permitindo que estas configurações sejam aplicadas aos novos estilos na medida que são criados.

Para criar um novo estilo:

1.	Selecione Ajuste / Estilos do ajuste. Aparece o diálogo Estilos do ajuste da rede.

2.	Clique Novo. Aparece o diálogo Novo estilo.

3.	No campo Nome, insira o novo nome do estilo. Nomes de estilo podem incluir até 255 caracteres, mas nomes mais curtos são mais fáceis de encontrar na lista de estilos.

4.	Clique OK. Aparece o diálogo Editar estilo do ajuste.

5.	Selecione uma das seguintes guias:

  Geral

  Apresentação da covariância

  Controles terrestres

  Erros de configuração

6.	Edite os controles de estilos desejados.

7.	Clique OK para salvar o novo estilo.


Para criar grupos de transformação

 Perspectiva geral e Mais informações

Um ou mais grupos de transformação podem ser criados para um ajuste de rede. Um vez criado, o grupo é adicionado à lista de Grupos.

NOTA: Somente novos grupos de transformação de observações GPS ou terrestres podem ser criados. Múltiplos grupos de transformação do geóide não serão premitidos.

Para criar um novo grupo:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS ou Terrestre.

3.	Clique Novo. Aparece o diálogo Novo grupo de transformação.

4.	Digite o nome do grupo no campo Nome.

5.	Clique OK. Aparece o diálogo Editar grupo de transformação com estas opções.

6.	Adicione observações da lista de Observações disponíveis à lista de Observações do grupo.

7.	Defina os parâmetros de transformação para os grupos ou configure-os para serem computados.

SUGESTÃO: Pode-se filtrar a lista para ocultar temporariamente tipos de observação para diminuir a lista. Listas menores lhe permitem encontrar observações mais rapidamente.

Para filtrar observações:

1.	Clique Filtrar. Aparece o diálogo Filtro da Observação. Inicialmente, as caixas de seleção de todos tipos de observação são marcadas, tornando visíveis todas as observações na lista de Observações disponíveis.

2.	Desmarque qualquer combinação de caixas de seleção para ocultar tipos de observação. A ação de filtração somente afeta a sessão atual de edição. Quando o diálogo fecha, os filtros são reconfigurados para os seus valores originais.

Para adicionar uma observação:

1.	Selecione a observação da lista de Observações disponíveis. O botão Adicionar torna-se disponível.

NOTA:  O campo de Transformação identifica os grupos de transformação já associados com as observações. Use este campo como um guia quando estiver adicionando observações. Observações individuais podem ser designadas somente para um grupo de transformação além do <GPS padrão> ou <Terr. padrão>. No entanto, as observações de um grupo podem ser transferidas para o grupo ativo selecionando-as e clicando Adicionar. Todas as observações GPS permanecem designadas ao <GPS padrão>, mesmo quando adicionadas a outro grupo de transformação. Igualmente, todas as observações terrestres permanecem designadas ao <Terr. padrão>, mesmo quando adicionadas a outro grupo de informação.

2.	Clique Adicionar.

A observação é adicionada à lista de Observações do grupo.

Para remover observações:

1.	Selecione a observação da lista do Observações do grupo. O botão Remover torna-se disponível.

2.	Clique Remover.

A observação é removida da lista de Observações do grupo.

NOTA: O estado de observações removidas muda na lista de Observações disponíveis. O campo Transformação para a observação é desmarcado, permitindo que a observação seja adicionada a outros grupos de informação.

NOTA: Observações não podem ser removidas dos grupos de transformação <GPS padrão>, <Terr padrão> ou <Geoid padrão>.

Para definir os parâmetros de transformação:

CUIDADO: Tenha extremo cuidado ao mudar um valor ou status do parâmetro de transformação. Antes de tentar efetuar tais mudanças, requer-se um sólido conhecimento da teoria do ajuste da rede e de ajustes de quadrados mínimos. Para uma lista de referências para aprender mais sobre a teoria do ajuste da rede e ajustes de quadrados mínimos, consulte a Bibliografia.

1.	Selecione o campo Valor para o parâmetro desejado.

2.	Edite o campo usando os princípios gerais apresentados em um dos seguintes tópicos:

  Desvio de longitude

  Desvio de latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

NOTA: Os parâmetros rotação do azimute, escala da rede, escala da distância e constante da distância não são usados para transformações do geóide.

3.	Selecione a opção apropriada da lista de Status. Para maiores informações, consulte os tópicos especificados acima.

4.	Para salvar mudanças, clique OK.


Para criar grupos de variância

Novos grupos de variância podem ser criados a qualquer momento entre os ajustes.

NOTA: Somente pode-se criar grupos de variância para observações GPS ou terrestre. Múltiplos grupos de variância do geóide não são permitidos.

Para criar grupos de variância:

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS ou Terrestre.

3.	Clique Novo para criar um Grupo de variância. Aparece o diálogo Novo grupo de variância.

4.	Insira o nome do novo grupo.

5.	Clique OK. Aparece o diálogo Editar grupo de variância. A lista de Observações disponíveis é usada para selecionar a observação para adicionar ao novo grupo.

6.	Selecione a observação desejada.

SUGESTÃO: Clique Filtrar para exibir o diálogo Filtro da Observação com opções para filtração dos tipos de observação na lista Observações disponíveis.

7.	Clique Adicionar.

8.	Repita os passos de 1 a 7 até terminar a criação do grupo.

9.	Clique OK. As mudanças são salvadas no projeto.


Para definir os parâmetros da transformação

 Perspectiva geral e Mais informações

CUIDADO: Tenha extremo cuidado ao mudar campos de valor do parâmetro de transformação. Antes de tentar efetuar tais mudanças, requer-se um sólido conhecimento da teoria do ajuste da rede e de ajustes de quadrados mínimos

Para mudar um valor do parâmetro:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo desejado.

4.	Clique Editar. Aparece o diálogo Editar grupo de transformação.

5.	Selecione o campo Valor para o parâmetro de transformação desejado.

6.	Insira o novo valor do parâmetro.

Considere os seguintes princípios gerais:

  Valores angulares são inseridos como DDD.MMSSssss com sinal.

  Valores lineares são inseridos nas unidades do projeto com sinal.

Princípios gerais para a mudança de Valor e Status de parâmetros individuais de transformação podem ser encontrados nos seguintes tópicos:

  Desvio de longitude

  Desvio de latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

NOTA: Os parâmetros Rotação do azimute, Escala da rede, Escala da distância e Constante da distância não são usados para transformações do geóide.

7.	Selecione o parâmetro de transformação Status na lista. Para maiores informações, consulte um dos tópicos especificados acima.

8.	Repita os passos de 2 a 7 para mudar os valores adicionais do parâmetro de transformação, se necessário.

Pode ser necessário mudar os campos Valor e Status de vários para criar a transformação desejada.

9.	Clique OK.

As mudanças são aplicadas ao grupo de transformação.


Para apagar grupos de transformação

 Perspectiva geral e Mais informações

Grupos de transformação definidos pelo usuário podem ser apagados quando não são mais necessários. Quando apagados, o grupo é removido do projeto e não pode mais ser acessado.

NOTA: Os grupos de transformação <GPS padrão>, <Terr. padrão>, e <Geóide padrão> não podem ser apagados. O botão Apagar é automaticamente desativado quando nenhum grupo além dos grupos padrões são estão listados.

Para apagar um grupo:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo.

4.	Clique Apagar. Aparece uma mensagem de verificação para confirmar a ação.

5.	Clique OK.


Para apagar grupos de variância

 Perspectiva geral e Mais informações

Grupos de variância podem ser apagados quando não são mais necessários. Grupos de variância apagados são removidos do projeto e não podem mais ser acessados.

NOTA: Os grupos de variância <GPS padrão>, <Terr. padrão> e <Geoid padrão> não podem ser apagados. O botão Apagar é desativado automaticamente quando nenhum outro grupo além do grupos padrões são listados.

Para apagar um grupo:

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo desejado.

4.	Clique Apagar. Uma mensagem de verificação confirma a ação.

5.	Clique OK.


Para apagar estilos de ajuste da rede

Estilos de ajuste da rede podem ser apagados quando não são mais requeridos. Quando apagados, o estilo é removido do projeto e não pode mais ser acessado.

NOTA: Deve existir ao menos um estilo na lista de estilos. O botão Apagar é automaticamente desativado se existir somente um estilo na lista. Se desejar apagar o último estilo e substituí-lo por outro, clique Novo para criar um novo estilo. Novos estilos são baseados Estilo de 95% dos Limites de confidência. Para maiores informações, consulte Criando Estilos de ajuste da rede.

Para apagar um estilo:

1.	Selecione Ajuste / Estilos do ajuste. Aparece o diálogo Estilos do ajuste da rede.

2.	Selecione o estilo da lista de estilos.

3.	Clique Apagar. Aparece uma mensagem e confirma a ação.

4.	Clique OK.


Para desativar observações de ajustes e recomputações

 Perspectiva geral e Mais informações

Se não quiser usar uma observação num ajuste de rede ou recomputação, ela pode ser desativada. Desativar uma observação remove-a do diálogo de Observações, mas não apaga permanentemente os seus dados do projeto.

Existem dois modos para desativar uma observação.

Para desativar observações do diálogo de Observações:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia GPS ou Terrestre.

3.	Passe para a observação desejada.

SUGESTÃO: Pode-se filtrar observações na lista de Observações disponíveis para mostrar ou ocultar tipos de observações selecionados, facilitando a busca de uma observação.

4.	Clique o lado direito da observação para acessar o menu de atalho e selecione Desativar. A observação é removida da lista e não será mais usada para futuros ajustes da rede e recomputações.

Observações na janela de gráficos tornam-se vermelhas quando são desativadas.

5.	Clique OK para salvar as mudanças no projeto.

Para desativar observações de uma janela de gráficos:

1.	Clique duas vezes a observação. Aparece a janela de Propriedades.

2.	Clique o botão do menu [image] da página de Resumo. Aparece a página do Resumo.

3.	Na lista de Status, selecione Desativar.

Se desejar re-ativar observações desativadas, deve-se editar as propriedades da observação na janela de gráficos.

NOTA: Desativar uma observação é diferente de excluir uma observação. Como observações desativadas, aquelas excluídas não são usadas para ajustes de rede ou recomputações. No entanto, elas ainda aparecem na lista de Observações. Os dados da observação não são apagados permanentemente do projeto, portanto, pode-se usar novamente uma observação previamente excluída.


Para editar opções de estilo de ajuste da visualização da covariância

 Perspectiva geral e Mais informações

Configuração da visualização da covariância pode ser editada a qualquer momento entre ajustes.

Para editar configurações de visualização da covariância:

1.	Selecione Ajuste / Estilos do ajuste. Aparece o diálogo Estilos de ajuste da rede.

2.	Selecione um estilo da lista de estilos.

3.	Clique Editar. Aparece o diálogo Editar estilos de ajuste.

4.	Na guia Estilo da covariância, edite as seguintes opções, como apropriado:

  Horizontal

  Tridimensional

5.	Após a edição das opções, clique OK. As mudanças são aplicadas ao estilo do ajuste.


Para editar opções do estilo de ajuste geral

As opções de Geral podem ser editadas a qualquer momento entre ajustes.

Para editar as configurações de Geral:

1.	Selecione Ajuste / Estilos do ajuste. Aparece o diálogo Estilos do ajuste da rede.

2.	Selecione um estilo da lista de estilos.

3.	Clique Editar. Aparece o diálogo Editar estilos do ajuste.

4.	Na guia Geral, marque ou desmarque as seguintes caixas de seleção:

  Usar perfil reduzido da coluna

  Termos restritos de covariância para linhas observadas

  Computar correlações para o modelo geóide

5.	Edite as opções de Tolerâncias residuais.

6.	Edite as opções dos Escalares do sigma.

7.	Insira um novo valor no campo Interações máximas.

8	Clique OK para salvar as mudanças.


Para editar as opções de estilo de controle terrestre

 Perspectiva geral e Mais informações

Pode-se editar as opções de Controle terrestre a qualquer momento entre ajustes.

Para fazê-lo:

1.	Selecione Ajuste / Estilos do ajuste. Aparece o diálogo Estilos do ajuste da rede.

2.	Selecione um estilo da lista de estilos.

3.	Clique Editar. Aparece o diálogo Editar estilos de ajuste.

4.	Na guia Controle terrestre, edite os valores de erro padrão para as medições apropriadas.

5.	Marque ou desmarque a caixa de seleção Efetuar ajuste vertical. Esta opção é selecionada quando se ajusta uma transversal 3D ou dados de nível.

6. 	Marque ou desmarque a caixa de seleção Efetuar ajuste horizontal. Esta opção é selecionada quando se ajusta uma transversal 2D.

7. 	Clique OK para salvar as mudanças.


Para editar grupos de transformação

 Perspectiva geral e Mais informações

Várias operações podem ser efetuadas quando se edita um grupo de transformação GPS ou terrestre. Elas incluem a adição de observações ao grupo, remoção de observações do grupo e definição dos parâmetros de transformação. A edição do grupo de tranformação do geóide é limitado à definição dos parâmetros de transformação.

Para editar o grupo de transformação GPS, terrestre ou geóide:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo de transformação.

4.	Clique Editar. Aparece o diálogo Editar grupos de transformação.

5.	Adicione ou remova observações (ver abaixo). (somente GPS ou terrestre)

6.	Defina os parâmetros de transformação (ver abaixo) ou configure-os para computar. (GPS, terrestre ou geóide)

Para filtrar observações num grupo de transformação GPS:

1.	Clique Filtrar. Aparece o diálogo Filtro da Observação. Inicialmente, as caixas de seleção de todos tipos de observação são marcadas, tornando visíveis todas as observações na lista de Observações disponíveis.

2.	Desmarque qualquer combinação de caixas de seleção para ocultar tipos de observação. A ação de filtração somente afeta a sessão atual de edição. Quando o diálogo fecha, os filtros são reconfigurados para os seus valores originais.

Para adicionar uma observação GPS ou Terrestre:

1.	Selecione a observação da lista de Observação disponível. A observação é realçada e o botão Adicionar torna-se disponível.

NOTA:  O campo de Transformação da lista de Observações disponíveis identifica grupos de transformação já associados às observações. Use este campo como um guia quando estiver adicionando observações. Observações individuais podem ser designadas a somente um grupo de transformação.

2.	Clique Adicionar.

A observação é adicionada à lista de Observações do grupo.

Para remover observações GPS ou terrestres de um grupo de transformação:

1.	Selecione a observação da lista de Observações do grupo. A observação é realçada e o botão Remover torna-se disponível.

2.	Clique Remover. A observação é removida da lista de Observações do grupo.

NOTA: Observações não podem ser removidas dos grupos de transformação <GPS padrão>, <Terr. padrão> ou <Geóide padrão>.

NOTA: O estado de observações removidas muda na lista de Observações disponíveis. O campo Transformação para a observação é desmarcado, permitindo que a observação seja adicionada a outros grupos de informação.

CUIDADO: Tenha extremo cuidado ao mudar um valor ou status do parâmetro de transformação. Antes de tentar efetuar tais mudanças, requer-se um sólido conhecimento da teoria do ajuste da rede e de ajustes de quadrados mínimos. Para uma lista de referências para aprender mais sobre a teoria do ajuste da rede e ajustes de quadrados mínimos, consulte a Bibliografia.

Para definir os parâmetros de transformação para um grupo de transformação GPS, terrestre ou geóide:

1.	Selecione o campo Valor para o parâmetro desejado.

2.	Edite o campo usando os princípios gerais num dos seguintes tópicos:

  Desvio de longitude

  Desvio de latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

NOTA: Os parâmetros Rotação do azimute, Escala da rede, Escala da distância e Constante da distância não são usados para transformações do geóide.

3.	Selecione a opção apropriada da lista de Status. Para maiores informações, consulte os tópicos especificados acima.

4.	Para salvar mudanças ao projeto, clique OK.


Para editar grupos de variância

 Perspectiva geral e Outras informações

Grupos de variância podem ser editados entre ajustes.

NOTA: O botão Editar para o grupo padrão de transformação do geóide somente lhe permite visualizar o grupo.

Para editar um grupo:

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo desejado.

4.	Clique Editar. Aparece o diálogo Editar grupo de variância. A lista de Observações do grupo mostra as observações do grupo e a lista de Observações disponíveis exibe todas observações ativadas do ajuste da rede.

Para adicionar observações:

1.	Selecione uma observação da lista de Observações disponíveis. A observação é realçada e o botão Adicionar torna-se disponível.

2.	Clique Adicionar.

A observação é adicionada à lista de Observações do grupo e removida da lista de Observações disponíveis.

Para remover observações:

1.	Selecione a observação da lista do Observações do grupo. A observação é realçada e o botão Remover torna-se disponível.

2.	Clique Remover.

A observação é removida do grupo e colocada na lista de Observações disponíveis.

Para salvar observações:

  Clique OK.

As mudanças são salvadas no projeto.


Para editar coordenadas na lista de Pontos

 Perspectiva geral e Mais informações

Pode-se editar as coordenadas de um ponto na Lista de pontos entre ajustes.

1.	Selecione Ajuste / Pontos. Aparece o diálogo Pontos.

2.	Use a barra de rolagem para encontrar o ponto a ser editado.

3.	Selecione o componente de coordenada a ser editado.

Quando um componente de coordenadas é editado, a caixa de seleção para o componente (no grupo Fixo) é marcada automaticamente.

Quando um componente do grupo Fixo é desmarcado, o componente da coordenada volta ao valor armazenado no campo antes da edição ser efetuada.

4.	Repita os passos anteriores para editar mais pontos.

5.	Depois de completar a sessão de edição, clique OK.

As mudanças são salvadas no projeto na visualização selecionada (isto é, WGS-84, grid ou local).


Para editar estratégias de ponderação

Perspectiva e Mais informações
Estratégias de ponderação podem ser definidas e aplicadas entre ajustes.

Para editar estratégias de ponderação:

1.	Selecione Ajuste / Estratégias de ponderação. Aparece o diálogo Ponderação escalar.

2.	Selecione a guia GPS, Terrestre ou Geóide. Aparece a lista de observações GPS, Terrestre ou Geóide.

3.	Configure a opção Aplicar escalares para para Todas observações, Cada observação ou Grupos de variância.

NOTA: Todas observações é a única opção disponível para o grupo de transformação do geóide.

4.	Escolha uma das seguintes opções:

  Se selecionou Todas observações ou Cada observação no passo anterior, passe para o passo 6.

  Se selecionou Grupos de variância, execute também o passo 5.

NOTA: Se selecionou o botão Cada observação, o tipo escalar Definido pelo usuário não será disponível.

5.	Se selecionou Gupos de variância no passo 3, a lista de observações é substituída pela lista de Grupos e todos os grupos de variância são exibidos. Efetue os seguintes passos:

a.	Configure Tipo escalar para Padrão, Alternativo, Definido pelo usuário ou Automático.

b.	Escolha uma das seguintes opções:

  Se selecionou Padrão, Alternativo ou Automático, passe para o passo 8.

  Se selecionou Definido pelo usuário, o cursor aparece no campo Escalar da lista de Grupos, e pode-se inserir o valor Escalar.

c.	Depois de inserir um valor Escalar, passe para o passo 8.

6.	Configure o Tipo escalar para Padrão, Alternativo, Definido pelo usuário ou Automático.

7.	Escolha uma das seguintes opções:

  Se selecionou Padrão, Alternativo ou Automático, passe para o passo 8.

  Se selecionou Definido pelo usuário, o campo Valor escalar torna-se disponível, permitindo-lhe inserir um valor Escalar. Insira o valor e execute o próximo passo.

8.	Clique OK ou Aplicar.

As mudanças serão salvadas.


Para editar opções de estilo do ajuste de erros de configuração

 Perspectiva geral e Mais informações

As opções Erros de configuração podem ser editados a qualquer momento entre ajustes.

Para editar as opções de Erros de configuração:

1.	Selecione Ajuste / Estilos de ajuste. Aparece o diálogo Estilos de ajuste da rede.

2.	Selecione um estilo da lista de estilos.

3.	Clique Editar. Aparece o diálogo Editar estilos de ajuste.

4.	Selecione a guia Erros de configuração. Aparece a opção Erros de configuração. Se necessário, faça o seguinte:

a.	Insira um novo valor no campo Erro na altura da antena ou Altura do instrumento.

b.	Insira novos valores nos campos de Erro de centragem.

5.	Depois de completar as mudanças, clique OK.

As mudanças serão salvadas.


Para incluir observações num ajuste

 Observações e Mais informações

Observações previamente excluídas dos ajustes de rede pode ser incluídos novamente.

Para incluir observações:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia GPS, Terrestre ou Geóide. Aparece a lista de Observações.

3.	Use a barra de rolagem para encontrar as observações.

4.	Marque as caixas de seleção em Usar coluna para incluir observações no ajuste da rede.

SUGESTÃO: Pode-se usar a tecla Shift ou a tecla Control para selecionar múltiplas observações.

5.	Clique OK.

As mudanças são salvadas no projeto.

NOTA: Para maiores informações sobre a exclusão de observações de um ajuste, consulte Excluindo ajustes.

NOTA: Observações também podem ser desativadas e reativadas. Para maiores informações, consulte Desativando observações e Reativando observações desativadas.

NOTA: Também pode-se usar a janela Propriedades para incluir observações no ajuste. Para fazê-lo, marque a caixa de seleção do ajuste da rede na página Resumo.


Para avaliar o relatório de Ajuste da rede

 Perspectiva geral e Mais informações

Na medida que ajustes sucessivos são efetuados, os resultados são visualizados no relatório de Ajuste da rede. Com base na avaliações de resultados relatados, ações são efetuadas para trazer a rede, progressivamente, à convergência. Estas ações podem requerer mudanças aos estilos do ajuste, incluindo ou excluindo observações, ativando ou desativando observações, carregando separações do geóide, criando grupos de transformação para aplicar transformações a grupos de observações, criando grupos de variância, aplicando estratégias de ponderação, restringindo pontos de controle e outras ações.

Para avaliar um relatório:

1.	Selecione Relatórios / Relatório ajuste da rede. O relatório é gerado e o visualizador HTML padrão para o seu computador é lançado, permitindo-lhe visualizar o relatório usando o visualizador.

2.	Navegue através do relatório para visualizar estatísticas selecionadas e avaliar os resultados.

Os tópicos abaixo fornecem princípios gerais para a avaliação de estatísticas de relatório. Para informações mais avançadas, consulte a Bibliografia.

Princípios gerais para avaliação de seções do relatório são incluídas no seguintes tópicos:

  Configurações do estilo do ajuste

  Tolerâncias residuais

  Apresentação da covariância

  Controles terrestres

 Erros de configuração

  Resumo estatístico

  Número de iterações

  Estatísticas globais

  Estatísticas da observação GPS

  Estatísticas do modelo geóide

  Estatísticas da observação terrestre

  Estratégias de ponderação

  Coordenadas ajustadas

  Coordenadas do grid

  Coordenadas geodésicas

  Deltas da coordenada

  Comparações da coordenada de controle

  Observações ajustadas

  Observações GPS

  Observações do geóide

  Observações terrestres

  Histogramas para residuais padronizados

  Elipses do erro do ponto

  Valores da covariante


Para filtrar observações

 Perspectiva geral e Mais informações

A filtração é útil quando se visualizam grandes quantidades de tipos de observação GPS ou terrestres. Pode-se, temporariamente, filtrar as observações enquanto o diálogo Observação está aberto. A ação de filtração oculta efetivamente os tipos de observação selecionados, fazendo com que a lista apareça mais curta. Quando a lista de Observações é filtrada, aparece a palavra ‘Filtrado’ no título do diálogo. Ao sair do diálogo, as observações filtradas são limpadas.

Para filtrar observações:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia GPS ou Terrestre. Aparece a lista de Observações.

3.	Clique Filtrar. Aparece o diálogo Filtro da Observação.

4.	Marque ou desmarque as caixas de seleção requeridas. Por padrão, todas as caixas de seleção estão marcadas.

No filtro de observação terrestre, deixe todas as observações selecionadas, a não ser que esteja confiante dos tipos de observação que deseja selecionar. Se selecionar uma opção, é o mesmo que selecionar uma observação parcial. Por exemplo, se selecionar o filtro de distância do elipsóide, somente poderá ver observações que contêm uma distância do elipsóide. Não obterá observações com um ângulo horizontal e distância do elipsóide, a não ser que selecione ambas opções de filtro.

  Se marcar a caixa de seleção do Azimute e desmarcar as caixas de verificação de outras observações, somente observações com azimutes digitados serão exibidas.

  Se marcar a caixa de seleção do Delta e desmarcar as caixas de seleção de outras observações, os dados de nível serão selecionados.

  Se desejar visualizar observações não processadas, marque as caixas de seleção ângulo horizontal, distância do elipsóide e elevação trigonométrica.

5.	Clique OK. Os tipos de observação selecionados são ocultos, mas ainda assim são usados no ajuste da rede.


Para filtrar observações de ponderação escalares

Perspectiva geral e Mais informações
A Filtração é útil quando se visualizam grandes quantidades de diferentes observações GPS ou terrestres. Pode-se, temporariamente, filtrar as observações enquanto o diálogo Observação está aberto. A ação de filtração oculta efetivamente os tipos de observação selecionados, fazendo com que a lista apareça mais curta. Quando a lista de Observações é filtrada, aparece a palavra ‘Filtrado’ no título do diálogo. Ao sair do diálogo, as observações filtradas são limpadas.

Para filtrar observações:

1.	Selecione Ajuste / Estratégias de ponderação. Aparece o diálogo Estratégias de ponderação.

2.	Selecione a guia GPS ou Terrestre. Aparece a lista de Observações.

3.	Clique Filtrar. Aparece o diálogo Filtro da Observação. Por padrão, todas as caixas de seleção estão marcadas.

4.	Marque as caixas de seleção requeridas para filtrar a lista de Observações disponíveis. Selecionando uma caixa de verificação limpa a sua marca. Limpando todas as marcas oculta todas observações.

No filtro de observação terrestre, deixe todas as observações selecionadas, a não ser que esteja confiante dos tipos de observação que deseja selecionar. Se selecionar uma opção, é o mesmo que selecionar uma observação parcial. Por exemplo, se selecionar o filtro de distância do elipsóide, somente poderá ver observações que contêm uma distância do elipsóide. Não obterá observações com um ângulo horizontal e distância do elipsóide, a não ser que selecione ambas opções de filtro.

  Se marcar a caixa de seleção do Azimute e desmarcar as caixas de verificação de outras observações, somente observações com azimutes digitados serão exibidas.

  Se marcar a caixa de seleção do Delta e desmarcar as caixas de seleção de outras observações, os dados de nível serão selecionados.

  Se desejar visualizar observações não processadas, marque as caixas de seleção ângulo horizontal, distância do elipsóide e elevação trigonométrica.

5.	Clique OK. Os tipos de observação selecionados são ocultos, mas ainda assim são usados no ajuste da rede.


Para filtrar observações do grupo de transformação

 Perspectiva geral e Mais informações

A Filtração é útil quando se visualizam grandes quantidades de diferentes observações GPS ou terrestres. Pode-se, temporariamente, filtrar as observações enquanto o diálogo está aberto. A ação de filtração oculta efetivamente os tipos de observação selecionados, fazendo com que a lista apareça mais curta. Quando a lista de Observações é filtrada, aparece a palavra ‘Filtrado’ no título do diálogo. Ao sair do diálogo, as observações filtradas são limpadas.

Para filtrar observações:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS ou Terrestre. Aparece a lista de Observações disponíveis.

3.	Clique Filtrar. Aparece o diálogo Filtro da Observação. Por padrão, todas as caixas de seleção estão marcadas.

4.	Marque as caixas de seleção requeridas para filtrar a lista de Observações disponíveis. Selecionando uma caixa de verificação limpa a sua marca. Limpando todas as marcas oculta todas observações.

No filtro de observação terrestre, deixe todas as observações selecionadas, a não ser que esteja confiante dos tipos de observação que deseja selecionar. Se selecionar uma opção, é o mesmo que selecionar uma observação parcial. Por exemplo, se selecionar o filtro de distância do elipsóide, somente poderá ver observações que contêm uma distância do elipsóide. Não obterá observações com um ângulo horizontal e distância do elipsóide, a não ser que selecione ambas opções de filtro.

  Se marcar a caixa de seleção do Azimute e desmarcar as caixas de verificação de outras observações, somente observações com azimutes digitados serão exibidas.

  Se marcar a caixa de seleção do Delta e desmarcar as caixas de seleção de outras observações, os dados de nível serão selecionados.

  Se desejar visualizar observações não processadas, marque as caixas de seleção ângulo horizontal, distância do elipsóide e elevação trigonométrica.

5.	Clique OK.

Os tipos de observação selecionados são ocultos, mas ainda assim são usados no ajuste da rede.


Para filtrar observações do grupo da variância

 Perspectiva geral e Mais informações

A Filtração é útil quando se visualizam grandes quantidades de diferentes observações GPS. Pode-se, temporariamente, filtrar as observações enquanto o diálogo está aberto. A ação de filtração oculta efetivamente os tipos de observação selecionados, fazendo com que a lista apareça mais curta. Quando a lista de Observações é filtrada, aparece a palavra ‘Filtrado’ no título do diálogo. Ao sair do diálogo, as observações filtradas são limpadas.

Para filtrar observações:

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS ou Terrestre. Aparece a lista de Observações disponíveis.

3.	Clique Filtrar. Aparece o diálogo Filtro da Observação. Por padrão, todas as caixas de seleção estão marcadas.

4	Marque as caixas de seleção requeridas para filtrar a lista de Observações disponíveis. Selecionando uma caixa de verificação limpa a sua marca. Limpando todas as marcas oculta todas observações.

No filtro de observação terrestre, deixe todas as observações selecionadas, a não ser que esteja confiante dos tipos de observação que deseja selecionar. Se selecionar uma opção, é o mesmo que selecionar uma observação parcial. Por exemplo, se selecionar o filtro de distância do elipsóide, somente poderá ver observações que contêm uma distância do elipsóide. Não obterá observações com um ângulo horizontal e distância do elipsóide, a não ser que selecione ambas opções de filtro.

  Se marcar a caixa de seleção do Azimute e desmarcar as caixas de verificação de outras observações, somente observações com azimutes digitados serão exibidas.

  Se marcar a caixa de seleção do Delta e desmarcar as caixas de seleção de outras observações, os dados de nível serão selecionados.

  Se desejar visualizar observações não processadas, marque as caixas de seleção ângulo horizontal, distância do elipsóide e elevação trigonométrica.

5.	Clique OK.

Os tipos de observação selecionados são ocultos, mas ainda assim são usados no ajuste da rede.


Para carregar separações do geóide

 Perspectiva geral e Mais informações

Antes de computar elevações para pontos ou fixar elevações, um modelo geóide deve ser designado ao projeto e as separações do geóide devem ser carregadas no projeto.

Tipicamente, separações do geóide são carregadas depois de produzir coordenadas em cada ponto usando um ajuste totalmente restrito usando o datum para o qual o modelo geóide é definido.

NOTA: Este arquivo de ajuda usa o termo observações do geóide para descrever as separações do geóide usadas nos ajustes de rede. As observações do geóide são carregadas no projeto, mas somente são usadas para ajustes.

Para carregar separações do geóide:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia Geóide.

3.	Escolha uma das seguintes opções:

  Se separações do geóide foram carregadas previamente, as observações serão exibidas na lista de Observações, e este procedimento pode ser interrompido aqui.

  Se a lista de Observações estiver vazia, as separações do geóide não serão carregadas no projeto e este procedimento deve ser completado.

4.	Clique Carregar. As separações do geóide para todos pontos correspondentes são carregadas no projeto e são exibidas na lista de Observações.

NOTA: O botão Carregar é exibido se o modelo do geóide não for definido para o projeto.

NOTA: Observações do geóide são interpoladas na posição do ponto atual. Se as posições de pontos mudaram significativamente, carregue novamente as observações do geóide.

5.	Clique OK.

As mudanças serão salvadas.


Para mover colunas da lista

 Perspectiva geral e Mais informações

Colunas da lista de Observações podem ser movidas para novos locais da lista.

Para mover colunas:

1.	Em qualquer lista de observação, mova o cursor sobre o cabeçalho da coluna. O cabeçalho contém o título da coluna e está localizado acima da primeira fila de dados.

2.	Escolha uma das seguintes opções:

  Para mover a coluna para a direita, arraste o cabeçalho para a direita até que o seu lado esquerdo passe para além da posição onde deseja inserir a coluna, então solte o botão do mouse.

  Para mover a coluna para a esquerda, arraste o cabeçalho da coluna para a esquerda até que o seu lado direito passe para além da posição onde quer inserir a coluna, então solte o botão do mouse.


Para navegar no relatório de Ajuste da rede

 Perspectiva geral e Mais informações

Uma vez visualizado o relatório no visualizador padrão de HTML do computador, use comandos de do visualizador para navegar através do relatório.

Siga os seguintes princípios gerais:

  Use os hyperlinks do Índice para mover para seções individuais do relatório.

  Use o comando do visualizador de HTML para voltar ao alto de uma página. A maioria de visualizadores possuem botão Voltar para este fim.

  Use as teclas Page Up e Page Down ou barras de rolagem para navegar para seções do relatório.

  Pressione Alt+Tab para mover para trás e para frente entre o software Trimble Geomatics Office e o visualizador de HTML.


Para remover um ajuste da rede

 Perspectiva geral e Mais informações

Use este comando para voltar a rede à mesma configuração como era antes de iniciar o ajuste.

Para remover valores ajustados, selecione Ajuste / Remover ajuste.

Quando usar este comando:

  o datum é configurado para WGS-84

  nenhum ponto possui um status fixo

  elipses de erro são removidas

  observações do geóide são baixadas

  se houve uma calibração antes do ajuste da rede, a calibração será feita novamente

  Coordenadas ajustadas são removidas

NOTA: Observações desativadas para o ajuste não serão reconfiguradas.


Para remover coordenadas da calibração

 Perspectiva geral e Mais informações

Coordenadas da calibração salvadas no projeto depois depois de um ajuste minimamente restrito podem ser removidas.

Para remover coordenadas de calibração, selecione Ajuste / Coordenadas de calibração / Remover.

As coordenadas de calibração são removidas do projeto.


Para remover observações do grupo de transformação

 Perspectiva geral e Mais informações

Observações podem ser removidas dos grupos de transformação GPS ou terrestre criados pelos usuário.

NOTA: Observações não podem ser removidas do grupo de transformação <Geoid padrão>.

Para remover observações de um grupo de transformação GPS:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS ou Terrestre.

3.	Selecione um grupo.

4.	Clique Editar. Aparece o diálogo Editar grupos de transformação.

5.	Na lista de Observações do grupo, selecione a observação desejada. O botão Remover torna-se disponível.

6.	Clique Remover. A observação é removida do grupo e aparece a lista de Observações disponíveis.

7.	Clique OK.

As mudanças são salvadas no projeto.


Para remover Observações do grupo da variância

 Perspectiva geral e Mais informações

Observações podem ser removidas dos grupos de variância GPS ou terrestre.

NOTA: Observações não podem ser removidas do grupo de variância <Geoid padrão>.

Para remover observações:

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS ou Terrestre.

3.	Selecione o grupo desejado.

4.	Clique Editar. Aparece o diálogo Editar grupos de variância.

5.	Selecione a observação desejada do Grupo de observações. A observação é realçada e o botão Remover torna-se disponível.

6.	Clique Remover. A observação é removida do grupo e colocada na lista de Observações disponíveis.

SUGESTÃO: Pode-se filtrar a lista de Observações disponíveis. A ação de filtração oculta tipos de observação selecionados, fazendo com que a lista apareça mais curta. Com menos observações na lista, as observações podem ser encontradas mais rapidamente.

7.	Clique OK para aplicar as mudanças.


Para renomear os estilos de ajuste da rede

 Perspectiva geral e Mais informações

Estilos de ajuste podem ser renomeados a qualquer momento entre ajustes.

Para renomear um estilo:

1.	Selecione Ajuste / Estilos de ajuste. Aparece o diálogo Estilos de ajuste da rede.

2.	Selecione o estilo desejado na lista de estilos.

3.	Clique Renomear. Aparece o diálogo Renomear estilo.

5.	Digite o novo nome de estilo no campo Nome.

6.	Clique OK.

As mudanças são salvadas e volta-se ao diálogo de Estilos de ajuste da rede.


Para mudar o tamanho de colunas

 Perspectiva geral e Mais informações

Colunas na lista de Observação podem ter seus tamanhos modificados para mostrar ou ocultar informações.

Para modificar o tamanho de uma coluna:

1.	Mova o cursor para o lado direito do cabeçalho desejado da coluna até que apareça o cursor redimensionador. O cabeçalho contém o título da coluna e está localizado acima da primeira fila de dados.

2.	Arraste o cabeçalho da coluna para a esquerda ou direita para alcançar a largura desejada. A largura da coluna aumenta ou diminui na medida que o cabeçalho move-se.

A coluna agora tem uma medida diferente.


Para salvar as coordenadas da calibração

 Perspectiva geral e Mais informações

Depois de completar um ajuste minimamente restrito com dados GPS num datum WGS-84 e estabelecer as coordenadas WGS-84 em cada um dos pontos no ajuste da rede, estas coordenadas podem ser usadas como coordenadas GPS observadas para uma calibração de local.

As coordenadas da calibração consistem das latitudes, longitudes e alturas do elipsóide de WGS-84.

NOTA: Este comando somente é disponível quando o WGS-84 é selecionado como o seu datum de ajuste e o ajuste foi efetuado usando somente dados GPS.

Para salvar coordenadas de calibração:

1.	Selecione Ajuste / Coordenadas de calibração / Salvar. Aparece o diálogo Salvar coordenadas de calibração.

2.	Selecione a opção para Criar coordenadas sob pontos existentes ou a opção para Criar coordenadas sob novos pontos com sufixo.

3.	Clique OK.

As coordenadas da calibração são salvadas e podem ser visualizadas na janela de Propriedades.


Para selecionar o datum para um ajuste

 Perspectiva geral e Mais informações

Durante um ajuste pode-se configurar a definição do datum para os resultados do ajuste. Esta configuração não muda o datum do projeto configurado no diálogo Propriedades do projeto. Durante um ajuste GPS minimamente restrito, tipicamente de configura o datum para WGS-84. Antes de um ajuste minimamente restrito de dados terrestres, configura-se o datum para o datum do projeto. Uma vez que se esteja preparado para o ajuste totalmente restrito, configura-se o datum como sendo o datum do projeto.

1.	Para visualizar o submenu do Datum, selecione Ajuste / Datum. Um menu aparece com as seguintes escolhas:

  WGS-84

  Datum do projeto − <nome do datum>

2.	Selecione o datum.


Para configurar o status fixo para restringir coordenadas

As configurações de Fixo podem ser usadas para restringir os componentes de coordenada dos pontos incluídos no ajuste da rede.

NOTA: Quando se fixa um componente da coordenada do ponto (2D, Altura, Elev) no diálogo Pontos, uma coordenada ajustada é criada. Coordenadas ajustadas podem ser visualizadas na janela Propriedades.

Para configurar os ajustes de Fixo:

1.	Selecione Ajuste / Pontos. Aparece o diálogo Pontos.

2.	Use a barra de rolagem para encontrar o ponto desejado e selecione o ponto.

3.	Ao editar um componente de coordenada, o componente é automaticamente fixo no grupo da opção Fixo.

NOTA: Pode-se identificar pontos que já possuem coordenadas de controle inseridas pelo (NL, e, a) na coluna de fixo. Os parênteses indicam que o ponto ainda não foi fixo.

NOTA: Se o componente da coordenada que já foi fixo for limpado, o componente da coordenada volta para o valor de coordenada antigo (ou seja, muda no diálogo antes de ser editado).

NOTA: Pode-se limpar as configurações de Fixo a qualquer momento para lançar as restrições da coordenada designadas para o ponto.

4.	Clique OK.

As mudanças são salvadas no projeto.


Para classificar colunas da lista

 Perspectiva geral e Mais informações

A lista de Observações ou Pontos pode ser organizada em ordem crescente ou decrescente.

Inicialmente, a lista de Observações é organizada com os residuais exibidos no alto da lista. A lista de Pontos é organizada primeiramente com os pontos fixo. Pode-se clicar no cabeçalho de qualquer coluna para organizar a lista na ordem crescente ou decrescente, com base no conteúdo da coluna.

Para organizar uma coluna:

1.	Mova o cursor sobre o cabeçalho da coluna. O cabeçalho contém o título da coluna e está localizado acima da primeira fila de dados.

2.	Clique o botão esquerdo do mouse uma vez para organizar a coluna na ordem crescente.

Pode-se repetir os passos para colocar a coluna de volta na ordem decrescente. Idealmente, organize outras colunas na ordem crescente ou decrescente. A classificação das colunas geralmente facilita a busca de dados, especialmente quando a lista contém grandes quantidades de dados.


Para ajustar uma rede

 Perspectiva geral e Mais informações

O ajuste da rede é um processo iterativo que começa com um ajuste minimamente restrito, seguido de ajustes sucessivos. Princípios gerais básicos sobre como iniciar os ajustes são fornecidos aqui juntamente com referências a outros tópicos, onde instruções mais específicas são incluídas à ações de execução para trazer, progressivamente, a rede em convergência.

Antes de iniciar o primeiro ajuste, examine os seguintes tópicos:

1.	Datum do ajuste

2.	Estilos de ajuste da rede

3.	Observações

4.	Pontos

5.	Pontos Fixos

6.	Incluindo e excluindo

7.	Configurar estratégia de ponderação escalar

8.	Carregar e baixar separações do geóide

9.	Criar ou editar grupos de variância

10.	Criar ou editar grupos de transformação

Ajustes

Siga os seguintes passos para iniciar o ajuste:

1.	Para iniciar o ajuste, escolha uma das seguintes opções:

  Selecione Ajuste / Ajustar.

  Pressione F10.

Mensagens de progresso são exibidas na barra de status na medida que o ajuste da rede procede e os resultados do ajuste são exibidos na janela de gráficos.

2.	Uma vez que o ajuste é completado, visualize o relatório do Ajuste da rede e avalie os resultados.

Juntamente com os dados gerados durante o ajuste, o relatório inclui uma mensagem que indica se o ajuste foi bem sucedido ou não.


Para baixar separações do geóide

 Perspectiva geral e Mais informações

Separações do geóide podem ser baixadas do ajuste.

NOTA: As separações baixadas do geóide somente são removidas do ajuste, não do projeto. O geóide ainda estará selecionado para o projeto e usado numa recomputação.

NOTA: Este arquivo de ajuda usa o termo ‘observações do geóide’ para descrever as separações do geóide usadas nos ajustes da rede.

Para baixar separações do geóide:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia Geóide.

3.	Para decidir se separações podem ou não ser baixadas, escolha uma das seguintes opções:

  Se a lista de Observações estiver vazia, as separações do geóide não serão carregadas no projeto e este procedimento pode ser interrompido aqui.

  Se as separações do geóide foram carregadas anteriormente, as observações serão exibidas na lista de Observações, e este procedimento pode ser concluído.

4.	Clique Descarregar. As separações do geóide serão baixadas do ajuste e a lista de Observações será limpada.

5.	Clique OK.

As mudanças serão salvadas.


Para usar dados do GPSurvey

Perspectiva geral e Mais informações
O software Trimble Geomatics Office pode ser usado com dados de redes no Trimble GPSurvey. Um extra passo de importação é requerido. Deve-se importar os arquivos de solução da linha de base (.ssf e .ssk) no projeto, e então ajustar estas linhas de base (observações) usando o software Trimble Geomatics Office. Igualmente, importe os pontos de controle conhecidos usando um arquivo ASCII gerado em GPSurvey.

Para importar dados de GPSurvey:

1.	Crie um novo projeto do software Trimble Geomatics Office. Escolha as mesmas propriedades do projeto selecionadas para o projeto do GPSurvey.

2.	Para selecionar o comando de Importação, selecione Arquivo / Importar.

3.	Selecione a guia Dados de levantamento.

4.	Selecione arquivos SSF/SSK (*.ssf, *.ssk).

5.	Clique OK.

6.	Navegue para a pasta \GPSurvey\Projetos\*Nomeprojeto*\Trimvec, que contém os arquivos desejados.

7.	Realce os arquivos desejados.

8.	Clique Abrir. A importação inicia e as linhas de base são exibidas na tela.

9.	Use a guia Personalizar do diálogo importar para importar o arquivo ASCII, usando os passos acima.

Agora você estará pronto para importar adicionais dados GPS e iniciar o ajuste no software Trimble Geomatics Office.


Para verificar os parâmetros de transformação

Perspectiva geral e Mais informações
Parâmetros de transformação podem ser verificados a qualquer momento entre ajustes.

Para verificar parâmetros de transformação:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Role a lista pelo grupo desejado.

4.	Selecione o grupo.

5.	Clique Editar. Aparece o diálogo Editar grupo de transformação.

O campo Nome do grupo mostra o nome designado ao grupo. Visualize as observações no grupo a partir da lista de Observações do grupo e as observações disponíveis do projeto a partir da lista de Observações disponíveis. A lista do Parâmetro de transformação do lado esquerdo superior exibe as configurações atuais do parâmetro de transformação.

6.	Verifique os parâmetros de transformação na lista do Parâmetro de transformação.

7.	Se necessário, edite os parâmetros de transformação.

Os seguintes tópicos fornecem princípios gerais para a definição de parâmetros de transformação:

  Desvio de longitude

  Desvio de latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

8.	Para sair do diálogo, escolha uma das seguintes opções:

  Se você somente verificou os parâmetros de transformação, clique Cancelar. Nenhuma mudança será salvada.

  Se você editou os parâmetros de transformação, clique OK e as mudanças serão salvadas.


Para visualizar os resultados do Qui-quadrado

 Perspectiva geral e Mais informações

O teste do Qui-quadrado é uma avaliação do fator de referência da rede (FR) e dos graus de liberdade. Se o FR for próximo a 1,0, os graus de liberdade são aceitáveis e a rede está integrando-se matematicamente, então o ajuste de rede deve passar o teste de Qui-quadrado.

Para visualizar os resultados do teste de Qui-quadrado:

1.	Selecione Relatórios / Relatório do ajuste da rede. O visualizador padrão de HTML inicia e o relatório do Ajuste da rede aparece com o Cabeçalho do ajuste no alto.

2.	No Índice, no lado esquerdo da tela, clique Resumo estatístico. Aparece o campo Teste de Qui-quadrado.

3.	Ao concluir a sessão, saia do visualizador.


Para visualizar o status fixo do ponto

O Status fixo de pontos de controle incluídos num ajuste de rede podem ser visualizados entre ajustes.

1.	Selecione Ajuste / Pontos. Aparece o diálogo Pontos.

2.	Use a barra de rolagem para visualizar pontos de controle.

O status fixo de componentes da coordenada do ponto de controle é configurado quando uma marca de seleção aparece e é limpada. Igualmente, o componente correspondente da coordenada aparece na coluna Fixo, ou os parênteses são removidos do identificadores de pontos de qualidade de controle.

3.	Clique Cancelar. Nenhuma mudança é salvada no projeto.

NOTA: A qualidade da coordenada também pode ser visualizada na janela de Propriedades. Se um ponto possuir um status de fixo, ele aparece como controle fixo.


Para visualizar os graus de liberdade

 Perspectiva geral e Mais informações

Use estas estatísticas para visualizar a quantidade de redundância na rede.

Para visualizar o valor de graus de liberdade:

1.	Para visualizar o relatório, selecione Relatórios / Relatório de ajuste da rede. O visualizador padrão de HTML inicia e o relatório do Ajuste de rede aparece com o Cabeçalho de ajuste no alto.

2.	No Índice, do lado esquerdo da tela, clique Resumo estatístico.

O campo graus de liberdade  está localizado nesta seção do relatório.

Este campo representa o número de observações independentes incluídas no ajuste que são usadas para sobredeterminar as suas soluções. Maior o número melhor, desde que todas observações sejam independentes. Para maiores informações, consulte o tópico Para selecionar linhas de base independentes.

3.	Ao terminar a sessão, saia do visualizador de HTML.


Para visualizar o fator de referência da rede

 Perspectiva geral e Mais informações

Este valor lhe mostra o quanto os erros a posteriori do ajuste combinam com os residuais da observação; isto é, o fator de referência da rede lhe permite saber o quanto os erros aleatórios combinam com os erros estimados destas observações.

Para visualizar o valor do fator de referência da rede:

1.	Para visualizar o relatório, selecione Relatórios / Relatório do ajuste da rede.

O visualizador padrão de HTML inicia e o relatório do Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique Resumo estatístico.

O campo Fator de referência da rede é localizado nesta seção do relatório.

3.	Quando terminar a sessão, selecione o comando para sair o visualizador de HTML (geralmente Arquivo / Sair).


Para visualizar o relatório do Ajuste da rede

 Perspectiva geral e Mais informações

Depois de completar um ajuste, visualize o relatório do Ajuste da rede.

1.	Para visualizar o relatório, selecione Relatórios / Relatório do ajuste da rede. O relatório do Ajuste da rede aparece no visualizador de HTML do computador.

2.	Use estes princípios gerais para visualizar resultados do ajuste:

  Clique os hyperlinks do lado esquerdo da tela para mover para uma seção do relatório.

  Use o comando do visualizador HTML para voltar para cima da página. A maioria de visualizadores de HTML possuem um botão Voltar para esta finalidade.

  Use as teclas Page Up e Page Down, barras de rolagem ou outros comandos do visualizador de HTML para navegar através do relatório.

 Alterne entre o software Trimble Geomatics Office e o visualizador de HTML, pressionando Alt+Tab. Cada vez que apertar Alt+Tab, passa-se para a próxima janela aberta.

  Como o seu visualizador padrão de HTML é uma aplicação separada, pode-se minimizá-lo para a barra de tarefas e voltar ao software Trimble Geomatics Office para fazer mudanças a ajustes baseados nas suas avaliações. Pode-se então voltar ao relatório através da maximização da janela do visualizador de HTML e efetuar posteriores avaliações. Este processo pode ser repetido tantas vezes quantas for necessário para a atual sessão de avaliação do relatório.

  Talvez prefira imprimir o relatório para fazer as avaliações. Use o comando Imprimir do visualizador de HTML (geralmente Arquivo / Imprimir) para imprimir o relatório.

  Relatórios podem ser escritos para um arquivo para fins de arquivamento ou para ser imprimido mais tarde, através da impressão do relatório num arquivo.

  Se você possuir uma cópia do Adobe® Acrobat®, pode-se imprimir relatórios para um arquivo e destilar o arquivo. Isso lhe fornece uma documentação de relatórios visualizáveis, completa com hyperlinks.

  Relatórios podem ser enviados para terceiros através do comando de e.mail do visualizador de HTML. Para aplicações em tempo real, isso pode ser útil para enviar relatórios para observadores em movimento no campo. Também pode ser útil para transferência de dados de relatório do campo para um arquivo central.

3.	Feche o visualizador de HTML.


Para visualizar observações selecionadas para ajuste

 Perspectiva geral e Mais informações

Visualize a lista de Observações para verificar as observações usadas no ajuste:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia GPS, Terrestre ou Geóide. Aparece a lista de Observações selecionadas.

3.	Use a barra de rolagem para navegar pela lista.

4.	Depois de visualizar as observações, clique Cancelar.

Nenhuma mudança é salvada ao projeto.


Para visualizar observações do grupo de transformação

 Perspectiva geral e Mais informações

Observações do grupo de transformação podem ser visualizadas a qualquer momento entre os ajustes.

Para visualizar observações do grupo de transformação:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Avance pela lista e selecione o grupo desejado.

4.	Clique Editar. Aparece o diálogo Editar grupo de transformação.

O campo Nome do grupo mostra o nome designado ao grupo. Visualize as observações no grupo a partir da lista Observações do grupo e as observações disponíveis do projeto da lista de Observações disponíveis.

5.	Depois de visualizar observações do grupo, clique Cancelar.

Nenhuma mudança é salvada ao projeto.


Para visualizar grupos de transformação

 Perspectiva geral e Mais informações

Grupos de transformação podem ser visualizados a qualquer momento entre ajustes.

Para visualizar grupos de transformação:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Avance pela lista para o grupo desejado.

4.	Selecione o grupo.

5.	Clique Editar. Aparece o diálogo Editar grupo de transformação.

O campo Nome do campo mostra o nome designado ao grupo. Visualize as observações no grupo a partir da lista de Observações do grupo e as observações disponíveis do projeto da lista de Observações disponíveis. A lista do Parâmetro de transformação no lado superior esquerdo mostra as atuais configurações do parâmetro de transformação.

SUGESTÃO: Também pode-se visualizar os parâmetros de transformação da guia Ajuste da guia Sistema de coordenada na janela de Propriedades do projeto.

6.	Depois de visualizar o grupo, clique Cancelar.

Nenhuma mudança é salvada ao projeto.


Para visualizar parâmetros de transformação

Perspectiva geral e Mais informações
Parâmetros de transformação podem ser visualizados entre ajustes.

SUGESTÃO: Também pode-se visualizar parâmetros de transformação a partir da guia Ajuste da guia Sistema de coordenada detalhado, na janela Propriedades do projeto.

Para visualizar parâmetros de transformação:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione o grupo de transformação desejado na lista.

4.	Clique Editar. Aparece o diálogo Editar grupo de transformação.

A lista Parâmetros de transformação está localizada no lado superior esquerdo dos diálogos, sob o campo Nome do grupo.

Para maiores informações sobre parâmetros individuais, consulte os seguintes tópicos:

  Desvio de longitude

  Desvio de latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

NOTA: Os parâmetros Rotação do azimute, Escala da rede, Escala da distância e Constante da distância não são usados para transformações do geóide.

Para maiores informações, consulte Parâmetros de transformação.


Para visualizar observações do grupo

 Perspectiva geral e Mais informações

Siga os seguintes passos para visualizar um Grupo de variância de observações Geóide ou GPS.

1.	Selecione Ajuste / Grupos de observação / Grupos de variância. Aparece o diálogo Grupos de variância.

2.	Selecione a guia GPS, Terrestre ou Geóide.

3.	Selecione um Grupo de variância.

4.	Clique Editar. Aparece o diálogo Editar grupo da variância com a lista de observações.

5.	Use a barra de rolagem para mover pela lista de observações.

6.	Clique Cancelar. Nenhuma mudança é salvada ao projeto.


Para incluir uma linha de base num ajuste da rede

Perspectiva geral e Mais informações
Se uma linha da base foi removida de um ajuste da rede por alguma razão, as suas propriedades podem ser mudadas para incluí-las em futuros ajustes da rede.

NOTA: Para que possa ser usada num ajuste da rede, a linha de base também deve estar ativada.

Para incluir uma linha de base em futuros ajustes da rede:

1.	Clique duas vezes na linha de base. Aparece a janela Propriedades.

2.	Na janela Propriedades, abra a Página resumo.

3.	Marque a caixa de seleção Usar no ajuste da rede para incluir a linha de base em ajustes futuros.

4.	Depois de completar as mudanças, clique OK.


Para remover uma observação de um ajuste de rede

 Perspectiva geral e Mais informações

Pode-se remover uma observação de ajustes futuros através de mudanças nas suas propriedades.

Para fazê-lo:

1.	Clique duas vezes na observação. Aparece a janela Propriedades.

2.	Clique o botão da página de Resumo [image]. Na página de Resumo, a caixa de seleção Usar em ajuste da rede estará marcada se a linha de base estiver incluída em futuros ajustes da rede.

3.	Desmarque esta caixa de seleção. A observação será removida de ajustes de rede futuros.

4.	Depois de completar as mudanças, clique OK.

NOTA: Também pode-se remover uma observação de um ajuste da rede no diálogo Observações.


Para excluir observações de um ajuste da rede

 Perspectiva geral e Mais informações

Todas observações ajustáveis são marcadas para ajuste quando observações são importadas. No entanto, observações individuais podem ser excluídas de um ajuste usando o diálogo Observação. A exclusão de uma observação não apaga-a do projeto.

Para excluir observações:

1.	Selecione Ajuste / Observações. Aparece o diálogo Observações.

2.	Selecione a guia GPS ou Terrestre.

3.	Na lista Observações, localize a observação que deseja excluir.

SUGESTÃO: Observações podem ser filtradas na lista de Observações disponíveis para mostrar ou ocultar tipos de observação. Ocultando tipos de observação selecionados temporariamente reduz o tamanho da lista, facilitando a busca de observações.

4.	Certifique-se de que a caixa de seleção Usar coluna da observação está desmarcada.

5.	Uma vez que as observações estejam excluídas, clique OK para salvar as mudanças no projeto.

NOTA: Observações também podem ser excluídas de um ajuste limpando a opção Usar em ajuste da rede na página de Resumo da janela de Propriedades.

Observações que foram excluídas de um ajuste podem ser incluídas novamente.

NOTA: Observações também podem ser desativadas e reativadas. Para maiores informações, consulte Desativando observações e Reativando observações desativadas.


Para reativar observações desativadas para ajustes

 Perspectiva geral e Mais informações

Observações desativadas do diálogo Observações ou janela de gráficos podem ser reativadas. Uma vez reativadas, as observações aparecem no diálogo Observações e podem ser usadas para ajustes e recomputações da rede futuros.

NOTA: A reativação de uma observação e a inclusão de uma observação são duas operações diferentes. Observações excluídas podem ser incluídas em ajustes da rede futuros marcando a caixa de seleção Usar para a observação no diálogo de Observações ou marcando a caixa de seleção Usar no ajuste da rede na página de Resumo da janela de Propriedades. Observações desativadas não podem ser reativadas a partir do diálogo Observações; elas devem ser reativadas selecionando a observação e visualizando a janela de Propriedades na janela de gráficos. Para maiores informações, consulte Incluindo observações num ajuste.

Para ativar observações de uma janela de gráficos:

1.	Clique duas vezes na observação. Na janela de gráficos, observações desativadas aparecem em vermelho.

2.	Aparece a janela Propriedades.

3.	Clique o botão da página de Resumo [image] para abrir a página de Resumo.

4.	Na lista de Status, selecionar Ativar.

5.	Certifique-se de que a caixa de seleção Usar no ajuste da rede esteja selecionado.

6.	A observação é reativada e será usada para futuros ajustes da rede e recomputações. Na janela de gráficos, a observação não estará mais em vermelho.

NOTA: Para maiores informações sobre a inclusão e exclusão de observações, consulte Incluindo observações e Excluindo observações.


Para combinar diferentes tipos de observação num ajuste da rede

Pode-se combinar observações GPS, terrestres e de geóide num ajuste de rede para produzir um grupo de coordenadas de ajuste.

Para combinar observações, deve-se ligar observações terrestres na rede de GPS. Caso contrário, quando se faz um ajuste, pode aparecer uma mensagem de erro. Para fazê-lo, meça ângulos de distâncias em pontos comuns à rede GPS. Use ao menos dois pontos comuns (pontos observados tanto no grupo de dados GPS como terrestre, ou pontos de controle) que podem ligar os dois grupos de dados um ao outro. Isso evita que uma transversal terrestre seja um “apêndice” de uma observação GPS por um ponto.

Antes de efetuar um ajuste de rede totalmente restrito, consulte cada grupo de observações de modo que possa localizar erros com facilidade. Também será necessário efetuar ajustes minimamente restritos separados do GPS e de observações terrestres.

O procedimento recomendado para a combinação de observações num ajuste de rede inclui vários passos básicos. As seguintes seções apresentam um sumário breve deste fluxo.

1.  Importar dados

a.	Se você possuir pontos de qualidade de controle associados ao projeto, primeiro importe estes pontos para o projeto do Trimble Geomatics Office. Isso garante que estas coordenadas de controle são usadas como pontos de início numa recomputação. Para maiores informações, consulte Recomputação e A importância da homogeneização no ajuste da rede.

b.	Importe qualquer outros grupos de dados para o projeto. Certifique-se que qualquer sinalizador de erro seja investigado.

NOTA: Quando importar dados e a opção Sempre unir pontos duplicados não estiver selecionada no diálogo Opções do ponto duplicado, requer-se unir pontos duplicados.

2.	Preparar os dados GPS

Para efetuar um ajuste minimamente restrito nas observações GPS, proceda como no seguinte:

a.	Selecione os dados GPS da janela de gráficos.

b.	Processe os dados GPS.

c.	Efetue Fechamentos de circuito GPS e visualize o Relatório de fechamento de circuito para garantir que as observações GPS sejam apropriadas para o ajuste.

d.	Remova todos sinalizadores fora da tolerância. Estes podem ser causados por coordenadas de controle incorretas, alturas de antena incorretas ou nome de ponto errado.

e.	Selecione linhas de base GPS independentes.

f.	Selecione o datum WGS-84.

g.	Selecione o estilo de ajuste. Se necessário, altere as configurações do estilo do ajuste.

h.	Na guia GPS do diálogo Observações, selecione as observações que devam ser incluídas no ajuste.

SUGESTÃO: Use o botão Filtrar do diálogo Observações para filtrar tipos de observações.

i.	Se necessário, defina os Grupos de observação (variância e/ou grupos de transformação) para os dados.

j.	Fixe um ponto de controle no diálogo Pontos. Isso é opcional.

k	Configure a estratégia de ponderação (para o ajuste inicial, configure o tipo de observação para Todas observações e o Tipo escalar para padrão).

l.	Efetue um ajuste minimamente restrito.

m	Visualize os detalhes no Relatório de ajuste da rede .

n.	Se necessário, configure o tipo escalar para Alternativo, efetue mais ajustes e verifique o Relatório de ajuste da rede. Faça isso até que o ajuste passe pelo teste de Qui-quadrado e os resultados do ajuste sejam satisfatórios.

NOTA: Se selecionar a opção do Tipo escalar automático no diálogo Estratégias de ponderação, as iterações do ajuste serão efetuadas até que o ajuste passe pelo teste do Qui-quadrado.

o.	Se selecionar a opção Escalar alternativo, ao completar a última iteração, bloqueie o valor escalar no diálogo Estratégias de ponderação.

p.	Se desejar efetuar uma Calibração do local GPS, salve as coordenadas da calibração. Coordenadas WGS-84 serão salvadas.

As suas observações GPS agora estarão prontas para um ajuste totalmente restrito.

3.  Preparar dados terrestres

Para efetuar ajustes minimamente restritos nos dados terrestres, proceda como no seguinte:

a.	Selecione as observações terrestres na janela de gráficos.

SUGESTÃO: Pode-se usar filtros para exibir somente observações terrestres.

b.	Selecione o datum do projeto.

c.	Na guia Terrestre do diálogo Observações, selecione observações a serem incluídas no ajuste.

NOTA: Se seus dados terrestres não consistirem de uma transversal fechada (isto é, observações terrestres sejam um apêndice da rede de observação GPS), também será necessário carregar observação do geóide para garantir que as observações GPS e terrestres possam ser ligadas umas às outras usando o geóide. Se dados do geóide forem incorporados no ajuste terrestre nesta fase, não há necessidade de seguir o Passo 4 abaixo.

d.	Se necessário, defina os Grupos de observação (grupos de variância e/ou transformação) para os dados.

e.	Configure a estratégia de ponderação. Para o primeiro ajuste, configure o tipo de observação para Todas observações e o tipo escalar para Padrão

f.	Fixe um ponto no diálogo de Pontos.

NOTA: Para efetuar um ajuste combinado, o ponto fixo deve ser um dos pontos comum entre GPS e a rede terrestre.

g.	Efetue um ajuste minimamente restrito.

h.	Visualize os detalhes do ajuste no Relatório de ajuste da rede.

i.	Se necessário, configure o tipo escalar para Alternativo, efetue outro ajuste e verifique o Relatório de ajuste da rede. Faça isso até ficar satisfeito com os resultados do ajuste.

NOTA: Se selecionou a opção Tipo escalar automático no diálogo Estratégias de ponderação, as iterações do ajuste são efetuadas até que o ajuste passe o teste do Qui-quadrado.

j.	Se usou a opção Escalar alternativa, bloqueie o valor escalar no diálogo de Estratégias de ponderação.

As suas observações terrestres agora estão prontas para um ajuste totalmente restrito.

4.	Incorporar observações geóide no ajuste

Erros do geóide são escalados num ajuste restrito das observações. Para efetuar um ajuste restrito vertical dos seus dados geóide, proceda da seguinte maneira:

a.	Certifique-se de que o modelo geóide foi selecionado para o projeto. Para fazê-lo, verifique os detalhes do sistema de coordenada no diálogo Propriedades do projeto.

b. 	No diálogo Observações, selecione a guia Geóide e carregue as Observações do geóide.

c. 	Configure a estratégia de ponderação do geóide. Para o ajuste inicial, configure o tipo escalar para Padrão.

d.	Fixe elevações (e/ou alturas) no diálogo de Pontos. Ao menos três restrições são recomendas.

e.	Efetue um ajuste.

f.	Visualize os detalhes do ajuste no Relatório de ajuste da rede.

g.	Se necessário, configure o tipo escalar para Alternativo, efetue outro ajuste e verifique o Relatório de ajuste da rede. Faça isso até que o ajuste passe pelo teste do Qui-quadrado e que os resultados sejam satisfatórios.

h.	Se a opção Tipo escalar alternativo foi usada, bloqueie o valor escalar no diálogo Estratégias de ponderação.

5.	Efetuar o ajuste restrito horizontalmente

Uma vez que a escala do erro do ajuste restrito minimamente seja bloqueado, pode-se efetuar um ajuste totalmente restrito.

Para fazê-lo:

a.	Certifique-se de que o datum do projeto ainda está selecionado.

b.	Fixe os pontos de controle no diálogo de Pontos.

NOTA: Para efetuar um ajuste combinado, deve-se fixar ao menos dois pontos GPS. Se possível, estes pontos devem ser pontos comuns entre a rede GPS e terrestre.

c.	Efetue um ajuste.

d.	Visualize os resultados do ajuste no Relatório de ajuste da rede.

e.	Se necessário, efetue mais ajustes até ficar satisfeito com os resultados do ajuste.

SUGESTÃO: Se o ajuste não convergir, o teste de Qui-quadrado falha ou o Fator de referência não for aceitável, pode ser que haja problemas nas suas coordenadas de controle. Solte os pontos (um de cada vez) no diálogo de Pontos e efetue novamente o ajuste totalmente restrito até encontrar o ponto errado. Para maiores informações, consulte o Manual do Usuário do Ajuste da Rede.


Para efetuar um ajuste da rede em observações GPS

O que segue é um curto resumo do fluxo requerido para ajustar observações GPS no software Trimble Geomatics Office:

1.	Importar dados de controle

a.	Se você possuir pontos de qualidade de controle associados ao projeto, primeiro importe estes pontos para o projeto do Trimble Geomatics Office. Isso garante que estas coordenadas de controle são usadas como pontos de início numa recomputação. Para maiores informações, consulte Recomputação e A importância da homogeneização no ajuste da rede.

b. 	Importe e verifique qualquer outros grupos de dados do projeto e investigue se existem quaisquer sinalizadores de erro.

NOTA: Quando importar dados e a opção Sempre unir pontos duplicados não estiver selecionada no diálogo Opções do ponto duplicado, requer-se unir pontos duplicados.

2.	Prepare os dados GPS

a.	Processe os dados GPS.

b.	Efetue Fechamentos de circuito GPS e visualize o Relatório de fechamento de circuito para garantir que as observações GPS sejam apropriadas para o ajuste.

c.	Remova todos sinalizadores fora da tolerância. Estes podem ser causados por coordenadas de controle incorretas, alturas de antena incorretas ou nome de ponto errado.

d.	Selecione linhas de base GPS independentes.

e.	Selecione o datum WGS-84.

f.	Selecione o estilo de ajuste. Se necessário, altere as configurações do estilo do ajuste.

g.	Na guia GPS do diálogo Observações, selecione as observações que devam ser incluídas no ajuste.

SUGESTÃO: Use o botão Filtrar do diálogo Observações para filtrar tipos de observações.

h.	Se necessário, defina os Grupos de observação (variância e/ou grupos de transformação) para os dados.

i.	Fixe um ponto de controle no diálogo Pontos. Isso é opcional.

j	Configure a estratégia de ponderação (para o ajuste inicial, configure o tipo de observação para Todas observações e o Tipo escalar para padrão).

k.	Efetue um ajuste minimamente restrito.

l	Visualize os detalhes no Relatório de ajuste da rede.

m.	Se necessário, configure o tipo escalar para Alternativo, efetue mais ajustes e verifique o Relatório de ajuste da rede. Faça isso até que o ajuste passe pelo teste de Qui-quadrado e os resultados do ajuste sejam satisfatórios.

NOTA: Se selecionar a opção do Tipo escalar automático no diálogo Estratégias de ponderação, as iterações do ajuste serão efetuadas até que o ajuste passe pelo teste do Qui-quadrado.

n.	Se selecionar a opção Escalar alternativo, ao completar a última iteração, bloqueie o valor escalar no diálogo Estratégias de ponderação.

o.	Se desejar efetuar uma Calibração do local GPS, salve as coordenadas da calibração. Coordenadas WGS-84 serão salvadas.

As suas observações GPS agora estarão prontas para um ajuste totalmente restrito.

3.	Incorporar observações do geóide no ajuste

Erros do geóide são escalados num ajuste restrito das observações. Para efetuar um ajuste restrito vertical dos seus dados geóide, proceda da seguinte maneira:

a.	Certifique-se de que o modelo geóide foi selecionado para o projeto. Para fazê-lo, verifique os detalhes do sistema de coordenada no diálogo Propriedades do projeto.

b. 	No diálogo Observações, selecione a guia Geóide e carregue as Observações do geóide.

c. 	Configure a estratégia de ponderação do geóide. Para o ajuste inicial, configure o tipo escalar para Padrão.

d.	Fixe elevações (e/ou alturas) no diálogo de Pontos. A Trimble recomenda ao menos três restrições.

e.	Efetue um ajuste.

f.	Visualize os detalhes do ajuste no Relatório de ajuste da rede.

g.	Se necessário, configure o tipo escalar para Alternativo, efetue outro ajuste e verifique o Relatório de ajuste da rede. Faça isso até que os resultados sejam satisfatórios.

h.	Se a opção Tipo escalar alternativo foi usada, bloqueie o valor escalar no diálogo Estratégias de ponderação.

5.	Efetuar o ajuste restrito horizontalmente

Uma vez que a escala do erro do ajuste restrito minimamente seja bloqueado, pode-se efetuar um ajuste totalmente restrito.

Para fazê-lo:

a.	Certifique-se de que o datum do projeto ainda está selecionado.

b.	Fixe os pontos de controle no diálogo de Pontos.

c.	Efetue um ajuste.

d.	Visualize os resultados do ajuste no Relatório de ajuste da rede.

e.	Se necessário, efetue mais ajustes até ficar satisfeito com os resultados do ajuste.

SUGESTÃO: Se o ajuste não convergir, o teste de Qui-quadrado falha ou o Fator de referência não for aceitável, pode ser que haja problemas nas suas coordenadas de controle. Solte os pontos (um de cada vez) no diálogo de Pontos e efetue novamente o ajuste totalmente restrito até encontrar o ponto errado. Para maiores informações sobre os diagnósticos de problemas, consulte o Manual do Usuário do Ajuste da Rede.


Para efetuar um ajuste de rede em observações terrestres

As seguintes seções fazem um resumo breve do fluxo requerido para ajustar observações terrestres no software Trimble Geomatics Office:

NOTA: Se quiser efetuar um ajuste da rede usando dados transferidos de um software Trimble Survey Controller, certifique-se de inserir um pressão, temperatura e correção de curvatura e refração no estilo do Survey Controller quando estiver efetuando um levantamento. Também será necessário definir uma projeção para o projeto.

1.  Importar dados de controle

a.	Se você possuir pontos de qualidade de controle associados ao projeto, primeiro importe estes pontos para o projeto do Trimble Geomatics Office. Isso garante que estas coordenadas de controle são usadas como pontos de início numa recomputação. Para maiores informações, consulte Recomputação e A importância da homogeneização no ajuste da rede.

b. 	Importe e verifique qualquer outros grupos de dados do projeto. Certifique-se que todos sinalizadores de erro sejam investigados.

NOTA: Quando importar dados e a opção Sempre unir pontos duplicados não estiver selecionada no diálogo Opções do ponto duplicado, requer-se unir pontos duplicados.

2.	Prepare os dados GPS

Para efetuar um ajuste minimamente restrito dos dados terrestres, proceda da seguinte maneira:

a.	Importe e verifique os dados terrestres (investigue todos sinalizadores de erro gerados).

b.	Se tiver pontos duplicados no projeto e a opção Sempre unir pontos duplicados não estiver selecionada no diálogo Opções do ponto duplicado, requer-se unir pontos duplicados.

c.	Selecione o datum do projeto.

d.	Na guia Terrestre do diálogo Observação, selecione a observação a ser incluída no ajuste.

e.	Se necessário, defina os Grupos de observação (variância e/ou grupos de transformação) para os dados.

f	Configure a estratégia de ponderação. Para o ajuste inicial, configure o tipo de observação para Todas observações e o Tipo escalar para Padrão.

g.	Efetue um ajuste minimamente restrito.

h	Visualize os detalhes no Relatório de ajuste da rede.

i.	Se necessário, configure o tipo escalar para Alternativo e efetue mais ajustes até que os resultados do ajuste sejam satisfatórios.

NOTA: Se selecionar a opção do Tipo escalar automático no diálogo Estratégias de ponderação, as iterações do ajuste serão efetuadas até passar pelo teste do Qui-quadrado.

j.	Se usou a opção tipo escalar Alternativo, bloqueie o valor escalar no diálogo Estratégias de ponderação.

As observações terrestres estão agora prontas para um ajuste completamente restrito.

2.	Efetuar o ajuste restrito horizontalmente

Uma vez que a escala do erro do ajuste restrito minimamente seja bloqueado, pode-se efetuar um ajuste totalmente restrito. Para fazê-lo:

a.	Certifique-se de que o datum do projeto ainda está selecionado.

b.	Fixe os pontos de controle no diálogo de Pontos.

c.	Efetue um ajuste.

d.	Visualize os resultados do ajuste no Relatório de ajuste da rede.

e.	Se necessário, efetue mais ajustes até ficar satisfeito com os resultados do ajuste.

SUGESTÃO: Se o ajuste não convergir, o teste de Qui-quadrado falha ou o Fator de referência não for aceitável, pode ser que haja problemas nas suas coordenadas de controle. Solte os pontos (um de cada vez) no diálogo de Pontos e efetue novamente o ajuste totalmente restrito até encontrar o ponto errado. Para maiores informações sobre os diagnósticos de problemas, consulte o Manual do Usuário do Ajuste da Rede.


Para ajustar observações do nível

O que segue abaixo é um curto resumo do fluxo requerido para ajustar observações do nível no software Trimble Geomatics Office:

1.  Importar observações do nível

Proceda da seguinte maneira:

a.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

b.	Na guia Levantamento, selecione Arquivos do nível digital (*.dat, *.raw). Aparece o diálogo Abrir.

c.	Selecione o arquivo do nível digital para importar. Aparece o diálogo Importação do nível digital. Use este diálogo para verificar as observações do nível.

d.	Clique OK.

O nível digital é importado.

NOTA: Também pode-se importar manualmente elevações do delta para o projeto usando o Formato Trimble Data Exchange.

NOTA: Para visualizar as informações do nível no relatório de Nível, selecione Relatórios / Relatórios de nível.

2.  Visualizar observações do nível

Quando dados de nível digital são importados, geralmente não há coordenadas horizontais associadas com as elevações, portanto não elas não podem ser visualizadas na visualização do Levantamento (a não ser que já existam coordenadas horizontais para o ponto no projeto e que os pontos duplicados sejam unidos). No entanto, pode-se visualizar observações do nível na janela de Propriedades. Para fazê-lo:

a.	Escolha Selecionar / Todos.

b.	Escolha uma das seguintes opções:

  Selecione Editar / Propriedades.

  Clique Alt + Enter.

  Selecione a ferramenta Janela de Propriedades da barra de ferramentas.

Agora pode-se visualizar as observações do nível.

3.  Efetuar um ajuste minimamente restrito

Para ajustar observações do nível, proceda da seguinte maneira:

a.	Selecione o datum do projeto.

b.	Selecione o estilo do ajuste da rede.

c.	Selecione as observações para incluir no ajuste a partir do diálogo Observações.

SUGESTÃO: Use o filtro do diálogo de Observações para selecionar somente observações da elevação delta.

d.	Carregue observação do geóide no diálogo Observações – guia Geóide.

e.	Na guia Terrestre do diálogo Observações, defina os grupos de Observação (grupos de variância e/ou transformação) para os dados.

f.	Configure a estratégia de ponderação. Para fazer isso, no diálogo Estratégias de ponderação, selecione a guia Terrestre. Então, nos grupos Aplicar escalar e Tipo escalar, selecione as opções apropriadas.

g.	Fixe um ponto no diálogo Pontos.

NOTA: Geralmente, este ponto será o ponto da estação para o qual foi definida um elevação no diálogo Importação do nível digital.

h.	Efetue um ajuste minimamente restrito.

i.	Visualize os resultados do ajuste no Relatório de ajuste da rede.

j.	Se necessário, efetue outros ajustes e até ficar satisfeito com os resultados.

k.	Se usou a opção do tipo escalar Alternativo, bloqueie o valor escalar no diálogo de Estratégias de ponderação.

4. Efetuar um ajuste completamente restrito

a.	Certifique-se de que o datum do projeto ainda está selecionado.

b.	Fixe pontos de controle no diálogo Pontos.

c.	Efetue um ajuste totalmente restrito

d.	Visualize os resultados do ajuste no relatório de Ajuste da rede.

e.	Se necessário, efetue outros ajustes até que os resultados do ajuste sejam satisfatórios.

Quando o ajuste estiver completo, um grupo de coordenadas do ajuste é salvado para cada ponto do ajuste. Estas coordenadas podem ser visualizadas na janela Propriedades.


Para usar o tipo escalar automático

No diálogo Estratégias de ponderação, pode-se fazer uma escolha dos seguintes tipos escalares:

  Padrão

  Alternativo

  Definido pelo usuário

  Automático

Ao iniciar um ajuste, o software configura a estratégia de ponderação para aplicar o tipo escalar padrão para todas observações. No ajuste, o escalar padrão multiplica o erro a priori por 1,00, deixando as estimativas do erro invariáveis.

Se o erro estimado das suas observações combinar com o erro real, o fator de referência especificado deve ser de aproximadamente 1,00. Se não o for, deve-se fazer uma escala do erro estimado para o erro real. A maneira mais simples de aplicar o escalar é selecionar o tipo escalar alternativo. O tipo escalar alternativo usa o fator de referência do ajuste atual, multiplicado pelo escalar anterior, para determinar o escalar para o próximo ajuste. Isso coloca o fator de referência mais próximo do 1,00. O escalar alternativo é aplicado à posteriores iterações do ajuste até passar pelo  teste de Qui-quadrado.

Se selecionar a opção Escalar automático, o processo de seleção do tipo escalar alternativo é automático; isto é, os ajustes não são completados até o teste do Qui-quadrado seja passado. Quando isso ocorrer, o valor escalar é bloqueado.

NOTA: Ao selecionar o tipo escalar automático, o relatório de Ajuste da rede mostra que o tipo escalar alternativo foi selecionado.

A importância da Detecção de Falhas

Falhas num grupo de dados causam a escala exagerada das outras observações (do mesmo grupo) do ajuste. Portanto, antes de usar o tipo escalar automático, certifique-se de que todas falhas forma removidas. Pode-se verificar se existem falhas ou dados errados rodando o ajuste usando a opção escalar padrão e então verificando os resultados.

NOTA: Sinalizadores de erro também indicam possíveis erros no grupo de dados.

Depois de usar a opção do tipo escalar Automático, examine com cuidado os resultados do ajuste, particularmente os histogramas de ajuste, para ter certeza de que uma falha não ficou oculta nas observações.

CUIDADO: A Trimble recomenda que não se use a opção do tipo escalar Automático para fazer escala de observações GPS e terrestres ao mesmo tempo.


    Diálogo Pontos - Perspectiva geral

Mais Informações

Como ...	Veja também
Perspectiva geral

Use este diálogo para visualizar, avaliar, e limitar os pontos em um ajuste. As coordenadas exibidas no diálogo Pontos são as coordenadas atuais para o ponto conforme mostrado na página do sumário Janela de Propriedades. Depois de um ajuste, o diálogo Pontos mostra os valores de coordenadas ajustados.

NOTA: Se um ponto é limitado (fixado) no diálogo Pontos, e não existir atualmente nenhuma coordenada de qualidade de controle, uma coordenada é armazenada para o ponto.

Para visualizar o diálogo Pontos:

  Selecione Ajuste / Pontos.

Estas opções estão disponíveis:

Ajuste de datum

O Ajuste de datum é mostrado acima da lista de pontos.

Pontos

Use esta lista para visualizar os pontos conectados a observações no Ajuste de rede. Esta lista não reflete a lista completa de pontos incluídos no projeto. Para mais informações sobre os campos da lista, veja Pontos.

Fixo

Use estas caixas de verificação para limitar os componentes de coordenada dos pontos individuais incluídos no Ajuste. Para mais informações, veja Fixo.

Visualização de Coordenada

A visualização determina o tipo de coordenada armazenado no projeto.

Grid − Selecione este botão para exibir pontos nas coordenadas de projeção de mapeamento configuradas na guia Sistema de Coordenadas do diálogo Propriedades de projeto. Esta é a visualização padrão.

Local − Selecione este botão para exibir pontos nas coordenadas geográficas de datum do projeto configuradas no diálogo Propriedades de projeto.

WGS − Selecione este botão para exibir pontos em coordenadas geográficas WGS-84 .


    Pontos

Mais Informações

Como ...	Diálogo	Veja também
Perspectiva geral

Esta lista mostra os pontos conectados a observações incluídas no Ajuste de rede e não reflete a lista inteira de pontos incluídos no projeto.

Cada linha na lista inclui os dados para um ponto. Quando um componente de coordenada de um ponto é editado, a caixa de verificação de status Fixo é selecionada desde o grupo Fixo. Se o status Fixo na caixa de verificação é desmarcado, o componente de coordenada que foi editado é alterado de volta para a coordenada original.

SUGESTÃO: Colunas da lista podem ser movidas para novas localizações na lista, redimensionadas para mostrar mais ou menos informações, e armazenadas em ordem decrescente ou crescente.

As seguintes colunas estão disponíveis:

Coluna	O que mostra
Ponto	O nome designado ao ponto no Ajuste de rede.
Norte ou Latitude Local ou Latitude WGS-84	A coordenada norte do ponto na projeção de mapeamento selecionada para o projeto ou coordenada de Latitude do ponto no Projeto (local) ou elipsóide WGS-84.
Leste ou Longitude Local ou Latitude WGS-84	A coordenada leste do ponto na projeção de mapeamento selecionada para o projeto ou coordenada de Longitude do ponto no Projeto (local) ou elipsóide WGS-84.
Altura	A altura do ponto acima ou abaixo do Projeto (local) ou elipsóide WGS-84. O valor é expresso em unidades de projeto.
Elev	A elevação do ponto acima ou abaixo do nível médio do mar. A elevação é mostrada após as separações geoidais serem carregadas e aplicadas. Este valor é exibido nas unidades do projeto.
Fixo	O status fixado (limitado) de cada componente da posição do ponto. Qualquer identificador de componentes de coordenada ou grupo de identificadores com parênteses indica que um ponto tem uma coordenada de qualidade de controle e não é fixado. Qualquer identificador de componente de coordenada ou grupo de identificadores sem parênteses mostra que o componente de coordenada é fixo para o ponto. Por exemplo, se um componente inclui o grupo de identificadores (NL, e), isto significa que o norte, leste, e elevação são de qualidade de controle.
Estes valores de status Fixos podem aparecer na coluna Fixado:

Exibição Fixado:	O que é Fixado:
____	O Ponto não é limitado por nenhum componente.
LL ou NL__	Posição horizontal é limitada.
__a_	Altura é limitada.
___e	Elevação é limitada.
LL ou NLa_	Posição horizontal e altura são limitadas.
LL ou NL_e	Posição horizontal e elevação são limitadas.
LL ou NLae	Posição horizontal, altura e elevação são limitadas.
__ae	Altura e Elevação são limitadas.

Quando você fixa um componente de coordenada de um ponto (2D, Altura, Elev) e o ponto não tem uma coordenada de qualidade de controle, a coordenada é atualizada na Janela de Propriedades com o mesmo tipo de coordenada que a visualização de Coordenada.

Visualização de Coordenada

Estes botões exibem os componentes de coordenadas horizontais dos pontos no sistema de coordenadas selecionado. Esta visualização também controla de que forma coordenadas editadas são salvadas.

Grid − Selecione este botão para exibir pontos nas coordenadas de projeção de mapeamento configuradas na guia Sistema de Coordenadas do diálogo Propriedades de projeto.

Local − Selecione este botão para exibir pontos nas coordenadas geográficas de datum do projeto configuradas nas propriedades de projeto.


    Fixo

Mais Informações

Como ...	Diálogo	Veja também
Perspectiva geral

Estas caixas de verificação configuram ou desmarcam o status fixo do componente de coordenada dos pontos.

Uma marca de verificação aparece quando qualquer componente de ponto de coordenada é limitado e é desmarcada quando nenhum componente de coordenada é limitado. Os componentes de coordenadas incluem 2D (horizontal), Altura (Elipsóide), e Elev (Elevação).

Estas opções estão disponíveis:

2D

Selecione esta caixa de verificação para limitar o ponto ao Norte e Leste ou componentes de coordenada de Latitude e Longitude.

Quando esta opção é selecionada, o status fixo é exibido na coluna Fixado da lista de Pontos

Altura

Selecione esta caixa de verificação para limitar a altura acima ou abaixo da elipsóide de projeto do ponto. Quando esta opção é selecionada, o status fixo é exibido na coluna Fixado da lista de Pontos.

Elev

Selecione esta caixa de verificação para limitar a elevação do ponto. Esta opção apenas é disponível após as separações geoidais serem aplicadas para observações de projeto. Este valor é exibido em unidades de projeto. Quando esta opção é selecionada, o status fixo é exibido na coluna Fixado da lista de Pontos.

NOTA: No datum WGS-84, não fixe mais que uma coordenada de grid.

Para mais informações sobre como limitar os componentes de coordenada de pontos, veja Ajuste de rede.


    Diálogo Observações - Perspectiva geral

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

O diálogo Observações contém as guias GPS, Terrestre e Geóide. Use estas guias para incluir ou excluir as observações GPS, terrestre e geóide num ajuste da rede e para visualizar os residuais da observação do ajuste.

Para abrir o diálogo de Observações:

  Selecione Ajuste / Observações.

Também pode-se desativar observações nas guias GPS e Terrestre. Desativando um observação evita que ela seja usada em ajustes e recomputações e que apareça na lista de Observações.

Uma vez desativada a observação, não pode-se ativá-la desde o diálogo de Observações. Para maiores informações, consulte Desativando observações e Reativando observações desativadas.

Na guia Geóide, também pode-se carregar e baixar separações do geóide.

As seguintes opções são disponíveis em cada guia:

Observações

Esta lista mostra observações GPS, Terrestre ou geóide. A aparência e conteúdo da lista varia de acordo com as observações. Para maiores informações sobre as colunas incluídas em cada lista, consulte os seguintes tópicos:

  Observações (GPS)

  Observações (Terrestre)

  Observações (Geóide)

Filtrar

Clique Filtrar para exibir o diálogo Filtro da Observação com opções para filtração de observações. Para maiores informações, consulte Filtrando observações.

Carregar (somente guia do Geóide)

Clique Carregar para carregar as separações do geóide do modelo geóide. Um modelo geóide deve ser selecionado na guia Sistema de coordenadas do diálogo Propriedades do projeto antes que este botão torne-se disponível.

O modelo geóide e coordenadas horizontais de cada Ponto são usados para interpolar para a separação do geóide naquele local. Quando se carregam separações do geóide, a elevação de cada ponto é obtida usando a altura do elipsóide observado e a separação do geóide observado. Tipicamente, separações do geóide são carregadas depois da produção de coordenadas em cada ponto usando um ajuste totalmente restrito, usando o datum para o qual o modelo do geóide é definido.

Para maiores informações, consulte Carregando separações do geóide.

Descarregar (somente guia Geóide)

Clique em Descarregar para remover as separações do geóide do projeto. Para usar separações do geóide novamente no projeto, recarregue as separações usando o botão Carregar. Este botão somente é disponível quando a guia do geóide está selecionada.

Este botão é desativado quando nenhum modelo do geóide é selecionado nas propriedades do projeto ou nenhuma separação do geóide é carregada no projeto.

Todas observações da lista de Observações são removidas quando observações são apagadas do projeto.

Para maiores informações, consulte Descarregando separações do geóide.


    Observações (GPS)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use a lista de Observações nesta guia para:

 incluir e excluir observações GPS

 visualizar residuais da observação

 desativar observações

A lista somente reflete as observações usadas no ajuste da rede. Somente pode-se editar a coluna Usar; as outras colunas são somente para referência.

SUGESTÃO: Pode-se filtrar observações nesta lista para mostrar qualquer combinação de observações RTK, Cinemática, Estática ou Contínua. A filtração lhe permite ocultar temporariamente determinadas observações para facilitar a busca de outras. Para maiores informações, consulte Filtrando Observações.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Usar	Marque ou desmarque estas caixas nesta coluna para incluir uma observação no, ou excluir uma observação do, ajuste de rede. Use-a para identificar o estado atual de cada observação da lista.  NOTA: Também pode-se clicar o lado direito do mouse para exibir um menu com um comando para desativar a observação. Observações desativadas são removidas da lista de observações e não podem ser usadas num ajuste até que sejam reativadas. Observações desativadas não podem ser reativadas no diálogo de Observações. Para maiores informações, consulte Reativando observações desativadas.
Obs	O número de registro designado à observações. Um "B" aparece no início do registro para mostrar que ele é para um tipo de observação GPS.
Do Ponto	O ponto de onde a observação é medida
Para Ponto	O ponto para o qual a observação é medida.
Tipo	O método de levantamento usado para coletar um observação. Valores possíveis são RTK, Cinemático, Estático e Contínuo.
Grupo da variância	O grupo da variância, se houver um, associado à observação.
Res. Pad. (máx)	O residual padronizado computado para a observação.

SUGESTÃO: Pode-se alterar o tamanho das colunas da lista, movê-las ou classificá-las.


Observações (Terrestres)

Mais informações

 Diálogo

Perspectiva geral

Use a lista de Observações nesta guia para:

 incluir ou excluir observações terrestres

 visualizar residuais da observação

 desativar observações

Somente a coluna Usar pode ser editada; todas outras colunas são somente para visualização.

SUGESTÃO: Pode-se filtrar observações nesta lista para mostrar qualquer combinação do azimute, ângulo horizontal, distância do elipsóide, elevação do delta ou observações da elevação trigonométrica. A filtração lhe permite ocultar termporariamente determinadas observações para facilitar a busca de outras.

No filtro da observação terrestre, mantenha todas as observações selecionadas a não ser que esteja confiante sobre os tipos de observação que deseja selecionar. Se selecionar uma opção, é o mesmo que selecionar uma observação parcial.

Por exemplo, se filtro da distância do elipsóide for selecionado, somente serão obtidas informações que contêm uma distância do elipsóide. Não serão vistas observações com um ângulo horizontal e distância do elipsóide, a nãos ser que ambas opções, ângulo horizontal e distância do elipsóide, sejam selecionados.

  Se marcar a caixa de seleção Azimute e desmarcar as caixas de verificação de outras observações, somente as observações com azimutes digitados serão visualizados.

  Se marcar a caixa de seleção Elevação do delta e desmarcar as caixas de seleção de outras observações, os dados do nível serão selecionados.

  Se desejar visualizar observações não processadas, consulte o ângulo horizontal, distância do elipsóide e opções da elevação trigonométrica.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Usar	Marque esta caixa para incluir uma observação no, ou excluir uma observação do, ajuste de rede e use-a para identificar o estado atual de cada observação da lista.  NOTA: Também pode-se clicar o lado direito do mouse para exibir um menu com um comando para desativar a observação. Observações desativadas são removidas da lista de observações e não podem ser usadas num ajuste até que sejam reativadas. Observações desativadas não podem ser reativadas no diálogo de Observações. Para maiores informações, consulte Reativando observações desativadas.
Obs	O número de registro designado à observações. O número do registro é precedido da letra "T" para mostrar que ele é para um tipo de observação terrestre.
Ponto VA	O nome do ponto de visada atrás.
Ponto do instrum.	O nome do ponto do instrumento.
Ponto FS	O nome do ponto de visada adiante.
Grupo da variância	Qualquer grupo da variância associado às observações.
Res. Pad. (máx)	O residual padronizado computado para a observação.

SUGESTÃO: Pode-se alterar o tamanho das colunas da lista, movê-las ou classificá-las.

NOTA: Observações do nível e azimute são tratadas como observações terrestres. Para estas observações, considere o Ponto do instrum. como sendo o ponto "de" e o ponto FS com o ponto "para".


    Observações (Geóide)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use a lista de Observações desta guia para visualizar observações do geóide. Somente pode-se editar a coluna Usar. Todas outras colunas são somente para visualização.

Separações do geóide são computadas a partir do modelo atual para todos pontos do ajuste.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Usar	Marque esta caixa para incluir uma observação no, ou excluir uma observação do, ajuste de rede. Use-a para determinar o estado atual das observações.
Obs	O número de registro designado à observações. Um "G" aparece no início do registro para mostrar que ele é para um tipo de observação geóide.
Ponto	O nome do ponto usado para gerar a observação do geóide.
Separação	A diferença entre a altura (elipsóide) e a elevação (geóide).
Erro	O erro padrão das observações geóide. Ele é computado quando observações geóide são carregadas. Para substituir este erro padrão, configure o erro padrão mínimo no diálogo Estilos do ajuste da rede.
Grupo da variância	O nome do grupo da variância associado com uma observação. Observações do geóide somente listam o grupo da variância <Geóide padrão> nesta coluna.
Res. Pad..	O residual padronizado computado para a observação.

SUGESTÃO: Pode-se alterar o tamanho das colunas da lista, movê-las ou classificá-las.


    Diálogo Filtro de Observação - Perspectiva geral

Mais Informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este diálogo para filtrar os tipos de observação que aparecem na lista de Observações disponíveis.

Para visualizar o diálogo Filtro de Observações:

  Clique em Filtro desde qualquer diálogo com uma Lista de observações disponível.

Todos os filtros são ativados por padrão, permitindo que todos os tipos de observações sejam exibidos e escondendo os tipos de observações na lista. Desmarque a verificação para desativar filtros individuais. A tabela seguinte mostra as opções disponíveis:

Marque esta caixa de seleção …	Para filtrar todas …
RTK	Obervações RTK (Cinemáticas em tempo real)
Cinemático	Observações cinemáticas
Estático	Observações estáticas
Contínuo	Segmentos de ocupação cinemáticos contínuos
Azimute	Observações de azimute. Esta opção seleciona observações de azimute digitadas.
Ângulo horizontal	Observações de ângulo horizontal
Distância do elipsóide	Observações da distância do elipsóide
Elevação do delta	Observações de elevações do delta. Esta opção para filtrar observações do nível.
Elevação trigonométrica	Observações trigonométricas. Estas observações são uma representação de um ângulo vertical e uma observação do distância do declive.

No filtro de observação terrestre, deixe todas as observações selecionadas a menos que você tenha certeza de quais tipos de observações quer selecionar. Por exemplo, se você selecionar o filtro da distância de elipsóide, então você apenas verá observações que contenham uma distância de elipsóide. Você não irá obter observações com um ângulo horizontal e distância de elipsóide a menos que você selecione ambas essas opções de filtro.

  Se você selecionar a caixa de verificação de Azimute e desmarcar as caixas de verificação para as outras observações, apenas observações com azimutes digitados serão exibidas.

  Se você selecionar a caixa de verificação de elevação Delta e desmarcar as caixas de verificação para as outras observações, os dados de nível serão selecionados.

  Se você quiser ver observações não processadas; selecione as caixas de verificação de ângulo horizontal, distância de elipsóide, e elevação trigonométrica.


    Diálogo de Grupos de Variância

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

O diálogo Grupos de Variância contém as guias GPS, Terrestre e Geóide. Use estas guias para visualizar, criar, editar, ou apagar grupos de variância de Observações GPS e observações terrestres, ou visualizar o grupo de variância padrão de separações geoidais.

Para acessar o diálogo Grupos de Variância:

  Selecione Ajuste / Grupos de observação / Grupos de variância.

Estas opções estão disponíveis em cada guia:

Grupos

Use esta lista para fazer seleções antes de editar ou apagar grupos de variância. Conforme novos grupos de variância vão sendo criados, eles são adicionados a esta lista.

Grupos de variância de Observações GPS são exibidos quando a guia GPS é selecionado, observações terrestres são exibidas quando a guia Terrestre é selecionado, e as observações geoidais são exibidas quando a guia Geóide é selecionado.

NOTA: Inicialmente, o grupo <Geóide padrão> não contém observações. As observações aparecem se um modelo geoidal é definido nas propriedades do projeto e separações geoidais são carregas no projeto.

Novo

Selecione este botão para criar a grupo de variância novo para o projeto.

Após selecionar este botão, o diálogo Grupo de variância novo é exibido com uma opção para designar um nome ao grupo de variância.

Quando você clicar em OK para criar o novo grupo, o diálogo Editar grupo de variância é exibido com opções para adicionar observações GPS ou observações terrestres ao grupo. Este botão não está disponível quando o grupo de variância <Geóide padrão> estiver sendo visualizado.

Editar

Selecione este botão para editar um grupo de variância existente selecionado da lista de Grupos. O grupo selecionado é carregado no diálogo Editar grupo de variância onde observações individuais podem ser adicionadas ou removidas do grupo.

Todos os grupos de variância GPS e terrestre podem ser editados e o grupo de variância Geóide somente pode ser visualizado.

Apagar

Selecione este botão para apagar o grupo de variância selecionado da lista de Grupos.

Após selecionar este botão, uma mensagem aparece requerendo verificar que o grupo de variância foi apagado. Você pode escolher OK para continuar ou Cancelar para abandonar esta ação.

NOTA: Você não pode apagar os grupos de variância <GPS padrão>, <Terr. Padrão>, ou <Geóide padrão>.

NOTA: Se você tiver observações sobre linhas muito curtas (< 25 metros), a Trimble recomenda que você crie ou separe grupo de variância para estas observações de forma que elas sejam escaladas separadamente de outras observações.


    Diálogo Editar Grupos de Variância - Perspectiva geral

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

O diálogo Editar grupos de variância contém as guias GPS, Terrestre, e Geóide. Use estas guias para visualizar, e editar grupos de variância, Observações GPS, observações terrestres, e separações geoidais. Para grupos de variância, editar é o processo de adicionar e remover observações.

Para visualizar o diálogo editar grupos de variância:

1.	Para visualizar o diálogo Grupos de Variância, selecione Ajuste / Grupos de observação / Grupos de variância. O diálogo Grupo de variância aparece.

2.	Selecione a guia GPS, Terrestre, ou Geóide.

3.	Selecione o grupo desejado.

4.	Clique em Editar.

O diálogo Editar grupos de variância aparece. Para mais informações, veja Editar Grupos de variância.

Estas opções estão disponíveis em cada guia:

Nome do Grupo

Visualize este campo para encontrar o nome designado ao grupo de variância. Este campo é somente para referência e não pode ser editado.

Observações de Grupo

Monitore esta lista para visualizar as observações em um grupo de variância. Três formas desta lista existem: uma aparece para Observações GPS, uma para observações terrestres, e a outra aparece para observações para as quais existem separações geoidais. Para mais informações sobre as colunas em cada lista, veja os tópicos:

  Observações de grupo (GPS)

  Observações de grupo (terrestre)

  Observações de grupo (geóide)

Observações Disponíveis

Monitore esta lista para visualizar todas as Observações GPS incluídas no ajuste de rede. Observações podem ser selecionadas desta lista e adicionadas ao grupo de variância. Todos os campos são somente para referência e não podem ser editados.

  Observações disponíveis (GPS)

  Observações disponíveis (terrestre)

  Observações disponíveis (geóide).

NOTA: A lista de Observações disponíveis aparece mas não está ativa quando o grupo de variância <Geóide padrão> estiver sendo editado.

Adicionar

Selecione este botão para adicionar observações a grupos de variância. Este botão somente está disponível quando uma observação é selecionada na lista de Observações disponíveis. A observação selecionada é adicionada à Lista de observações de grupo. Para mais informações, veja Adicionar Observações .

Remover

Selecione este botão para remover uma observação de um grupo de variância. Este botão somente está disponível quando uma observação é selecionada na lista de Observações de Grupo. Este botão somente está disponível quando grupos de variância definidos por usuário, não os grupos de variância padrão, estiverem sendo editados. Para mais informações, veja Remover Observações.

Filtrar

Selecione este botão para filtrar observações em uma lista de Observações disponíveis.

O diálogo Filtro de observações é exibido com opções para filtrar observações na lista.

No diálogo Editar grupo de variância para Observações GPS, você pode mostrar ou esconder qualquer combinação de tipos de observação RTK, Cinemática, Estáticas, e Contínuas, selecionando opções desde o diálogo. No diálogo Editar grupo de variância para observações terrestres, você pode mostrar ou esconder qualquer combinação de Azimute, Ângulo horizontal, distância de Elipsóide, Elevação Delta, ou Observações Trigonométricas.

Para mais informações, veja Filtrando Observações.


    Observações de Grupo (Grupo de Variância - GPS)

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Visualize as observações em um grupo de variância usando esta lista. Esta forma da lista apenas aparece para grupos de variância de Observações GPS.

Observações podem ser adicionadas a esta lista e removidas desta lista. Todos os campos são somente para referência e não podem ser editados. Quando uma observação é realçada nesta lista, o botão Remover fica disponível para remover observações da lista. Para mais informações, veja Adicionar Observações e Remover Observações.

Estas colunas estão disponíveis:

Coluna	O que mostra
Obs	O número de registro designado à observação no projeto.
De Pt	O ponto inicial da observação.
Para Pt	O ponto final da observação.
Tipo	O método usado para coletar a observação. Valores possíveis são Estático, Cinemático, RTK, e Contínuo.

SUGESTÃO: Você pode redimensionar, mover, ou classificar colunas na lista.


    Observações Disponíveis (Grupo de Variância - GPS)

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use esta lista para visualizar todas as Observações GPS que foram incluídas no ajuste de rede. Observações podem ser selecionadas desta lista e adicionadas ao grupo de variância. Todos os campos são somente para referência e não podem ser editados.

Cada linha na lista representa a informação do grupo de variância para uma observação. Use a lista como uma fonte para adicionar observações ao grupo de variância. Quando uma observação é selecionada na lista, o botão Adicionar torna-se disponível para adicionar observações à Lista de observações de grupo.

SUGESTÃO: Você pode usar o botão Filtro para mostrar qualquer combinação de observações RTK, Cinemática, Estática, ou Contínua. Filtrar esconde temporariamente observações para facilitar a visualização de outras. Para mais informações, veja Filtrando Observações.

Estas colunas estão disponíveis:

Coluna	O que mostra
Obs	O número de registro designado às observações no projeto.
De Pt	O ponto inicial da observação.
Para Pt	O ponto final da observação
Tipo	O método de levantamento GPS usado para coletar a observação. Os quatro valores possíveis são RTK, Cinemático, Estático, e Contínuo.
Grupo de variância	Se uma observação é designada a um grupo de variância.

SUGESTÃO: Você pode redimensionar, mover, ou classificar colunas na lista.


    Observações de Grupo (Grupo de Variância - Geóide)

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Cada linha na lista é um registro de observação armazenado no projeto. Você não pode editar nenhum dos campos.

Estas colunas estão disponíveis:

Coluna	O que mostra
Obs	O número do registro dos dados da observação armazenados no projeto.
Ponto	O nome do ponto, do qual as coordenadas são usadas para extrair as observações geoidais desde o modelo.
Separação	A altura da observação geoidal derivada desde o modelo geoidal definido nas propriedades do projeto.
Erro	O erro estimado na separação geoidal

SUGESTÃO: Você pode redimensionar, mover, ou classificar colunas na lista.


    Observações Disponíveis (Grupo de Variância - Geóide)

Mais informações

 Veja também

Perspectiva geral

A lista de observações disponíveis é desativada e não é usada.


    Diálogo Grupos de Variância Novos

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Use este diálogo para criar um grupo de variância novo.

NOTA: Este botão não está disponível quando a guia geóide é selecionado. Desde que o mesmo método seja usado para interpolar para cada observação geóide do mesmo modelo geoidal, não há necessidade de separá-las em grupos múltiplos.

Para visualizar o diálogo Grupos de Variância Novos:

1.	Para visualizar o diálogo Grupos de Variância, selecione Ajuste / Grupos de observação / Grupos de variância. O diálogo Grupos de variância aparece.

2.	Selecione a guia GPS, ou a guia Terrestre.

3.	Clique em Novo.

O diálogo Grupos de Variância Novos aparece.

Estas opções estão disponíveis:

Nome

Digite o nome do grupo de variância neste campo. Nomes de Grupos de variância contêm até 24 caracteres, mas nomes descritivos menores são mais fáceis de encontrar na lista de Grupos.

Após nomear o grupo de variância novo e clicar em OK, o diálogo Editar grupo de variância é exibido com opções para adicionar e remover observações de grupo de variância. Para mais informações, veja Criar Grupos de variância.


Observações de Grupo (Grupo de Variância - Terrestre)

Perspectiva geral

Nesta lista de Grupos, você pode visualizar suas observações em um grupo de variância. Esta forma de lista somente aparece para grupos de variância de observações terrestres.

SUGESTÃO: Você pode adicionar ou remover observações para ou de esta lista. (O botão Remover torna-se disponível quando uma observação é realçada na lista). No entanto, você não pode editar nenhum campo. Para mais informações, veja Adicionar Observações e Remover Observações.

Estas colunas estão disponíveis:

Coluna	O que mostra
Obs	O número de registro designado à observação no projeto.
Ponto BS	O nome da observação do ponto de visada de atrás.
Ponto Instr	O nome da observação do ponto do instrumento.
Ponto FS	O nome da observação do ponto de visada de frente.

SUGESTÃO: Você pode redimensionar, mover, ou classificar colunas na lista.

NOTA: Observações de nível e de azimute são tratadas como observações terrestres. Para estas observações, considere o ponto Instr como o "de" ponto e o ponto FS como o "para" ponto.

NOTA: Quando você cria um grupo de variância terrestre, um grupo separado é criado para cada tipo de observação. Por exemplo, se você criar um grupo de variância terrestre que contenha observações de distância e ângulo vertical, um grupo de variância terrestre é criado para as observações de ângulo e um grupo de variância terrestre é criado para observações de distância. Isso também ocorre para o grupo de variância <Terr. Padrão>.


Observações Disponíveis (Grupo de Variância - Terrestre)

Perspectiva geral

Nesta lista de Grupos, você pode visualizar todas as observações terrestres que foram incluídas no seu ajuste de rede. Cada linha representa a informação do grupo de variância para uma observação. Você pode selecionar observações da lista para adicionar ao grupo de variância. No entanto, você não pode editar nenhum campo.

Quando uma observação é selecionada na lista, o botão Adicionar torna-se disponível para adicionar observações para a Lista de observações de grupo.

SUGESTÃO: Você pode usar o botão Filtro para filtrar observações e mostrar qualquer combinação de azimute, ângulo horizontal, distância de elipsóide, elevação delta, e elevação trigonométrica. Filtrar temporariamente esconde algumas observações facilitando a visualização de outras. Para mais informações, veja Filtrar Observações.

Estas colunas estão disponíveis:

Coluna	O que mostra
Obs	O número do registro designado à observação no projeto.
Ponto BS	O nome do ponto de visada de atrás da observação.
Ponto Instr	O nome do ponto de instrumento da observação.
Ponto FS	O nome do ponto de visada de frente da observação.
Grupo de variância	Se uma observação for designada para um grupo de variância.

SUGESTÃO: Você pode redimensionar, mover, ou classificar colunas na lista.


    Diálogo Grupos de transformação - Perspectiva geral

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use o diálogo Grupos de transformação para criar, editar e apagar os grupos de transformação para o ajuste de rede. Este diálogo contém as guias GPS, Terrestre e Geóide. Use estas guias para visualizar ou selecionar grupos de transformação de observações GPS, observações terrestres, observações do geóide.

Para acessar o diálogo Grupos de transformação:

  Selecione Ajuste / Grupos de observação / Grupos de transformação.

As seguintes opções são disponíveis em cada guia:

Grupos

Use esta lista para selecionar um grupo de transformação de observações GPS, terrestre ou geóide.

O conteúdo da lista de Grupos muda quando a guia GPS, terrestre ou geóide são selecionadas.

Três grupos padrões de transformação (o grupo <GPS padrão>, o grupo <Terr. padrão> e o grupo <Geóide padrão>) são criados automaticamente. O grupo <Geóide padrão> pode estar vazio ou pode conter todas as observações para as quais existem separações do geóide.

NOTA: O grupo <Geóide padrão> é vazio se nenhum modelo do geóide for definido para o projeto ou se as separações do modelo geóide não foram carregadas no projeto. Para informações sobre a definição de um modelo geóide para um projeto, consulte Sistema de coordenadas. Para informações sobre o carregamento das separações do geóide de um modelo do geóide para ajuste, consulte Observações.

Uma lista da guia é fornecida para a seleção de dos grupos GPS, terrestre ou geóide. A guia GPS especifica o grupo <GPS padrão>, mais quaisquer outros grupos GPS definidos pelo usuário criados para o projeto. A guia Terrestre especifica o grupo <Terr. padrão>, mais quaisquer outros grupos terrestres definidos pelo usuário criados para o projeto. A guia geóide somente especifica o grupo <Geoid padrão>; novos grupos do geóide não podem ser criados.

Depois da seleção de um grupo da lista, um dos botões disponíveis pode ser selecionado para editar ou excluir o grupo de transformação, se aplicável.

Novo

Use este botão para criar um novo grupo de transformação. Este botão não é disponível para os grupos de transformação do geóide.

NOTA: Os grupos <GPS padrão>, <Terr. padrão> e <Geóide  padrão> nunca podem ser excluídos. O grupo de transformação <Geóide padrão> é o único grupo de transformação do geóide. Grupos múltiplos de transformação do geóide não são necessários porque as observações do geóide vêm de uma só fonte, o modelo geóide. Para o grupo <Geoid padrão>, somente os parâmetros da transformação podem ser editados.

Para maiores informações, consulte Criando Grupos de transformação.

Editar

Use este botão para visualizar ou editar grupos de transformação GPS, terrestres ou geóide. Este botão sempre é disponível quando a lista de grupos GPS, terrestre e geóide é exibida.

Depois de ter selecionado este botão, aparece o diálogo Editar transformação, com opções para a adição ou remoção de grupos de observação (somente GPS e terrestre) e edição dos parâmetros de transformação.

Para maiores informações, consulte Editando grupos de transformação.

Apagar

Use este botão para apagar grupos de transformação GPS ou terrestre selecionados. Os grupos <GPS padrão>, <Terr. padrão> e <Geoid padrão> nunca podem ser apagados do projeto. Somente podem ser apagados grupos de transformação GPS ou terrestre definidos pelo usuário.

NOTA: Como o grupo <Geoid padrão> não pode ser apagado e novos grupos de transformação do geóide não podem ser criados, este botão nunca é disponível quando grupos de transformação do geóide são selecionados.

Para maiores informações, consulte Apagando grupos de transformação.


    Diálogo Novos grupos de transformação

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use o diálogo Novo grupo de transformação para criar um novo grupo de transformação GPS ou terrestre.

NOTA: Este botão não é disponível quando a guia geóide é selecionada. Como o mesmo método é usado para interpolar para cada observação do geóide do mesmo modelo geóide, não há necessidade de separá-los em múltiplos grupos.

Para acessá-lo:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Selecione a guia GPS ou Terrestre.

3.	Clique Novo.

Aparece o diálogo Novo grupo de transformação.

Uma opção é disponível:

Nome

Digite o nome do grupo de transformação neste campo. Nomes do grupo de transformação podem conter no máximo 24 caracteres, mas nomes descritivos mais curtos são mais fáceis de encontrar na lista de Grupos.

Depois de dar nome a um novo grupo de transformação e de clicar OK, o diálogo Editar grupo de transformação é exibido com opções para adicionar e remover observações do grupo de transformação e definir parâmetros de transformação. Para maiores informações, consulte Criando grupos de transformação.


    Diálogo Editar grupos de transformação - Perspectiva geral

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use o diálogo Editar grupo de transformação para visualizar, editar e verificar grupos de transformação de observações GPS, terrestre ou geóide.

Para acessá-lo:

1.	Selecione Ajuste / Grupos de observação / Grupos de transformação. Aparece o diálogo Grupos de transformação.

2.	Na guia GPS, Terrestre ou Geóide, selecione o grupo desejado.

3.	Clique Editar.

Aparece o diálogo Editar grupo de transformação. Para maiores informações, consulte Editando grupos de transformação.

Para grupos de transformação GPS e terrestre, a edição é o processo de adição ou remoção de observações incluídas no ajuste de rede para o ou do grupo e definindo os parâmetros de transformação. Como os grupos de transformação do geóide contêm todas as observações ativadas no ajuste da rede, para o qual existem separações do modelo geóide, a edição é limitada à definição dos parâmetros de transformação.

NOTA: O grupo <Geóide padrão> é vazio se nenhum modelo geóide é definido para o projeto ou se as separações do geóide do modelo não foram carregadas no projeto. Para informações sobre a definição de um modelo de projeto para um projeto, consulte Sistemas de coordenadas. Para informações sobre o carregamento das separações do geóide de um modelo geóide, consulte Observações.

Toda combinação de parâmetros de transformação pode ser definida ou computada para aplicar transformações à observações em um grupo de transformação. Pode-se criar múltiplos grupos de transformação GPS ou terrestre e diferentes grupos de parâmetros da transformação podem ser aplicados para cada um daqueles grupos.

CUIDADO: Aplicando uma transformação de forma inadequada pode causar efeitos adversor no ajuste. Todos os parâmetros de transformação devem ser verificados antes de tentar as transformações em um grupo de observações.

As seguintes opções são disponíveis:

Nome do grupo

Este campo mostra o nome designado ao grupo de transformação. Este campo é somente para referência e não pode ser editado.

Lista do parâmetro de transformação

Use esta lista para definir, computar ou excluir os parâmetros de transformação.

Os seguintes parâmetros podem ser definidos ou computados:

  Desvio da longitude

  Desvio da latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura

Cada definição do parâmetro inclui um campo de Valor e uma lista de Status. Para maiores informações, consulte os seguintes tópicos:

  Valor

  Status

Por padrão, os seguintes parâmetros de transformação são configurados para computados para grupos de transformação de observações GPS:

  Desvio da longitude

  Desvio da latitude

  Rotação do azimute

  Escala da rede

Por padrão, somente a rotação do azimute é configurada para computado para as observações terrestres. Outros parâmetros podem ser configurados para definido pelo usuário ou computado, mas somente use-os quando existir um erro sistemático nas observações. Por exemplo, se um ajuste é executado e todas as distâncias (medidas por técnicas terrestres) possuírem um residual de +3 ppm, um parâmetro de escala da distância não pode ser computado porque obviamente ocorreu um erro durante a coleta de dados. Este erro sistemático pode ter ocorrido porque as configurações ppm do EDM não foram aplicadas.

NOTA: A rotação do azimute, escala da rede, escala da distância e parâmetros constantes da distância não são usados para as transformações do geóide.

Para obter princípios gerais básicos sobre a definição de parâmetros individuais de transformação ou grupos de parâmetros, consulte Parâmetros de transformação. Para maiores informações sobre as técnicas e práticas de transformação de dados de observação, consulte a Bibliografia.

Observações do grupo

Esta lista exibe as observações GPS, terrestre ou geóide incluídas no grupo de transformação. Podem aparecer diferentes variações desta lista, dependendo do tipo de observação.

Para maiores informações, consulte os seguintes tópicos:

  Observações do grupo (GPS)

  Observações do grupo (terrestre)

  Observações do grupo (geóide)

Observações disponíveis

Use esta lista para visualizar todas as observações do ajuste da rede e como a fonte para adicionar observações a um grupo de transformação. Todos os campos são para fins de visualização e não podem ser editados.

Para maiores informações sobre os campos nestas listas, consulte os seguintes tópicos:

  Observações disponíveis (GPS)

  Observações disponíveis (terrestre)

  Observações disponíveis (geóide)

NOTA: A lista de Observações disponíveis aparece mas não está ativa quando se edita o grupo de transformação <GPS padrão>, <Terr. padrão> ou <Geóide padrão>. Uma observação não pode ser removida dos grupos de transformação padrões GPS, terrestre ou geóide.

Adicionar

Use este botão para adicionar observações à lista de Observações do grupo. Este botão somente é disponível quando um observação é selecionada na lista de Observações disponíveis.

Remover

Use este botão para remover observações da lista de Observações do grupo.

Filtrar

Use este botão para exibir o diálogo Filtro de observação com opções para a filtração de tipos de observação na lista Observações disponíveis.


    Valor (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectivas gerais

Use os campos da segunda coluna da Lista do parâmetro de transformação para visualizar ou mudar o valor aplicado a cada parâmetro de transformação.

Este campo especifica os valores do parâmetro de transformação e a opção selecionada na lista de Status determina como aquele valor é gerado ou não gerado.

Os princípios gerais para a modificação do valor e status de parâmetros individuais são especificados nestes tópicos:

  Desvio da longitude

  Desvio da latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura


    Status (Parâmetro da transformação)

Mais informações

Diálogo	Ver também
Perspectiva geral

Use os campos da terceira coluna da Lista do parâmetro de transformação para selecionar o método usado para determinar um valor do parâmetro de transformação.

As seguintes opções são disponíveis:

Computado

Use esta opção para permitir que o software Trimble Geomatics Office compute o Valor do parâmetro de transformação como parte do ajuste. O valor para cada parâmetro da lista é computado quando coerções suficientes de ponto fixo (pontos fixos aos componentes da coordenada) são incluídas no ajuste. Para maiores informações sobre coerções de coordenadas, consulte Pontos.

Definido pelo usuário

Use esta opção para inserir um valor de parâmetro de transformação definido pelo usuário. Se um valor do parâmetro for conhecido, esta opção é selecionada como o status e o valor conhecido é inserido no campo do Valor associado.

CUIDADO: Tenha cuidado ao configurar o status do parâmetro nesta configuração e quando inserir valores de parâmetro definidos pelo usuário. Para obter princípios gerais sobre a definição do valor e status de parâmetros individuais, consulte Parâmetros de transformação.

Não usado

Use esta opção para desativar um valor do parâmetro de transformação. Se um valor for inserido no campo Valor, esta opção desativa o valor. Um valor de parâmetro desativado não é computado ou aplicado às observações no grupo de transformações. Esta é a configuração padrão para todos os parâmetros.

CUIDADO: Tenha cuidado ao selecionar a opção de Status para um valor do parâmetro de transformação. A aplicação inadequada de um valor do parâmetro de transformação pode causar efeitos negativos no ajuste.

Princípios gerais para a seleção da opção do Status para parâmetros individuais são incluídas nos seguintes tópicos:

  Desvio da longitude

  Desvio da latitude

  Rotação do azimute

  Escala da rede

  Escala da distância

  Constante da distância

  Constante da altura


    Desvio da longitude (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use o campo Valor e a lista Status para visualizar, verificar ou inserir a inclinação no horizonte geodésico local na direção leste-oeste, expressa em segundos do arco.

O desvio de longitude é um ângulo de rotação usado para a transformação do datum e algumas vezes (observações terrestres) para computar uma correção Laplace para azimutes astronômicos observados. Se você usar este ângulo de rotação, requerem-se três alturas (elevação e/ou elipsóide) fixas em posições horizontais conhecidas (não necessariamente fixas) da rede. O ângulo afeta as observações angular e linear, horizontal (exceto elevações delta) e vertical; e corresponde a um dos componentes para o desvio de vertical.

Para maiores informações, consulte Definindo os parâmetros de transformação.


    Desvio da latitude (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use os campos Valor e Status para visualizar, verificar ou definir a inclinação no Horizonte geodésico local na direção norte-sul, expressa em segundos de arco.

Desvio de latitude é um dos ângulos de rotação para uma transformação do datum usado na transformação de observações de um datum para outro. Se usar este ângulo de rotação, requer-se três alturas (elevação e/ou elipsóide) fixas em posições horizontais conhecidas (não necessariamente fixas) da rede. O ângulo afeta as observações angular e linear, horizontal (exceto elevações delta) e vertical; e corresponde a um dos componentes para o desvio de vertical.

Para maiores informações, consulte Definindo os parâmetros de transformação.


    Rotação do azimute (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use os campos Valor e Status para visualizar, verificar, computar ou inserir o ângulo de rotação do sistema de coordenadas em torno do normal em cada ponto (neste caso, normal é uma linha perpendicular ao elipsóide naquele ponto) para responder pela rotação do datum do ajuste ao datum da observação, expresso em segundos de arco. A rotação do azimute é usada para transformações do datum e afeta somente azimutes digitados.

Para observações GPS, a computação da rotação do azimute requer dois pontos horizontais fixos. Observações terrestres, por padrão, são rotadas para condizer com os azimutes GPS.

Por padrão, somente a rotação do azimute é configurada para computar por observações terrestres. Outros parâmetros podem ser configurados para definido pelo usuário ou computado, mas somente use-os quando um erro sistemático estiver nas observações. Por exemplo, se um ajuste é executado e todas as distâncias (medidas por técnicas terrestres) possuírem um residual de +3 ppm, um parâmetro de escala de distância pode ser computado porque obviamente ocorreu um erro sistemático durante a coleta de dados. Este erro sistemático pode ter ocorrido porque a configuração de ppm do EDM não foi aplicada.

NOTA: O parâmetro de rotação do azimute não é usado para transformações do geóide.

NOTA: A rotação somente é aplicada a observações do ajuste. Por exemplo, observações laterais, que não são incluídas no ajuste, não serão rotadas.

Para maiores informações, consulte Definindo parâmetros da transformação.


    Escala de rede (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use os campos Valor e Status para visualizar, verificar ou inserir um multiplicador da Escala da rede para aplicar a cada observação linear do ajuste. A Escala da rede é usada para a transformação de um grupo de observações de um datum para outro.

A computação da Escala da rede para observações GPS requer dois pontos horizontais fixos e um ponto vertical fixo.

A computação da Escala da rede para observações Terrestres requer dois pontos horizontais ou pontos verticais fixos.

A Escala da rede é aplicada a todas observações GPS lineares do grupo de transformações.

NOTA: O parâmetro da Escala da rede não é usado para transformações do geóide.

Para maiores informações, consulte Definindo os parâmetros de transformação.


    Escala da distância (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use os campos Valor e Status para visualizar, verificar ou inserir o multiplicador da Escala da distância à cada obsrvação de distância no grupo do parâmetro.

A Escala da distância é usada para transformações do datum e, algumas vezes, para corrigir erros sistemáticos em observações. Dois pontos horizontais fixos são requeridos quando se define este parâmetro.

NOTA: O parâmetro Escala da distância não é usado para transformações do geóide.

Para maiores informações, consulte Definindo parâmetros de transformação.


    Constante da distância (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use os campos Valor e Status para visualizar, verificar ou inserir um valor de distância constante, em unidades do projeto, para cada observação da distância no grupo de parâmetro GPS. Este parâmetro corrige erros sistemáticos de distância em observações. Dois pontos horizontais fixos são requeridos quando este parâmetro é definido.

NOTA: O parâmetro Constante da distância não é usado para transformações do geóide.

Para maiores informações, consulte Definindo os parâmetros da transformação.


    Constante da altura (Parâmetro da transformação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use os campos Valor e Status para visualizar, inserir, computar ou definir um valor da constante da altura a cada observação vertical do grupo de transformação. A constante da altura é usada para corrigir erros sistemáticos em observações e para transformar modelos de geóide. Este valor de parâmetro requer uma elevação e uma altura.

Este parâmetro corrige erros sistemáticos em observações verticais e é usado para transformar modelos de geóide.

Para maiores informações, consulte Definindo Parâmetros de transformação.


    Observações do grupo (Grupo da transformação - GPS)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use esta lista para visualizar grupos de transformação GPS e para adicionar ou remover observações do grupo de transformação GPS. Nenhum dos campos pode ser editado.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	A ID designada à observação. Números de observação GPS são precedidos pela letra "B".
Do Pt	O ponto de início da observação.
Para Pt	O ponto de término da observação.
Tipo	O método de levantamento usado para coletar a observação.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas.


    Observações disponíveis (Grupo de transformação - GPS)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva Geral

Use esta lista para visualizar todas as observações ativadas no ajuste da rede e como a fonte para adição de observações a um grupo de transformação GPS. Todos os campos são para fins de visualização e não podem ser editados.

Quando dados são inicialmente carregados num projeto, todas as observações ativadas são adicionadas ao grupo <GPS padrão>. Observações podem ser movidas para grupos de transformação definidos pelo usuário. No entanto, cada observação somente pode estar em um grupo definido pelo usuário.

Quaisquer observações podem ser selecionadas nesta lista e adicionadas ao grupo atual de transformação. Isso inclui observações designadas a outros grupos de transformação definidos pelo usuário. Quando um observação que pertence a outro grupo definido pelo usuário é adicionada ao grupo atual, ela é removida do outro grupo.

SUGESTÃO: Pode-se filtrar observações coletadas usando um ou mais métodos de levantamento. Observações filtradas são temporariamente ocultas, tornando a lista mais curta. O tamanho menor da lista facilita a busca de observações. Use o campo Tipo para aprender sobre o método de levantamento usado para coletar observações. Para maiores informações, consulte Filtrando observações.

NOTA: A lista não reflete todas as observações do projeto, somente as observações usadas no ajuste da rede.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	A ID designada à observação. A letra "B" precede os números de observações GPS.
Do Pt	O nome do ponto de início da observação.
Para Pt	O nome do ponto de término da observação.
Tipo	O método de levantamento usado para coletar a observação. Os quatro valores possíveis são RTK, Cinemático, Estático e Contínuo.
Grupo de transformação	A transformação à qual a observação é designada.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas.


    Observações do grupo (Grupo de transformação - Geóide)

Mais informações

 Ver também

Perspectiva geral

Use esta lista para visualizar o grupo de transformação <Geóide padrão>. Todos campos são somente para visualização e não podem ser editados.

Todas as observações do geóide usadas no ajuste da rede são automaticamente carregados nesta lista quando separações do geóide são carregadas no ajuste da rede.

Observações do geóide não podem ser apagadas desta lista. A única maneira de remover uma observação desta lista é desativando a observação, impedindo que seja usada no projeto.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	A ID designada à observação. A letra "G" precede os números de observações geóide.
Ponto	O nome do ponto do qual as coordenadas foram usadas para extrair as observações do geóide do modelo.
Separação	A separação do geóide entre o elipsóide WGS-84 e o nível médio do mar.
Erro	O erro estimado nas observações do geóide.
NOTA: O erro inicial estimado para separações do geóide é o erro padrão do grupo de observações. O software Trimble Geomatics Office computa a média de todas as separações do geóide no ajuste e então determina o erro padrão das separações. Isso é somente um ponto de início e pode ser necessário fazer uma escala das observações antes que uma representação verdadeira dos erros estimados seja alcançada.

NOTA: Pode-se mudar o erro padrão aumentando o erro padrão mínimo para as separações do geóide no diálogo Estilos de ajuste da rede.


    Observações disponíveis (Grupo de transformação - Geóide)

Mais informações

 Ver também

Perspectiva geral

A lista de Observações disponíveis é desativada e não é usada.


Observações do grupo (Grupo da transformação - Terrestre)

Perspectiva geral

Use esta lista para visualizar grupos de transformação terrestre e para adicionar ou remover observações do grupo de transformação terrestre. Não pode-se editar as informações nesta lista.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	A ID designada à observação. A letra "T" precede os números de observação terrestre. A letra "L" precede observações do nível.
Ponto VA	O nome do ponto de visada atrás da observação.
Ponto do intrum.	O nome do ponto do instrumento de elevação.
Ponto FS	O nome do ponto de visada adiante da observação.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas.

NOTA: As observações de nível e de azimute são tratadas como observações terrestres. Para estas observações, considere o Ponto do intrum. com um ponto "de" e o Ponto FS como o ponto "para".


Observações disponíveis (Grupo da transformação - Terrestre)

Perspectiva geral

Esta lista mostra as observações usadas no ajuste de rede. Use-a para visualizar todas as observações ativadas no ajuste da rede. Também pode-se usá-la como uma fonte para adicionar observações para um grupo de transformação terrestre. Não pode-se editar as informações nesta lista.

Quando dados são inicialmente carregados num projeto, todas as observações ativadas são adicionadas ao grupo <Terr. padrão>. Na medida que grupos de transformação são criados, as observações são removidas do grupo <Terr. padrão>.

Pode-se selecionar quaisquer observações da lista de Observações disponíveis e adicioná-las ao grupo de transformação atual. Isso inclui observações designadas a outros grupos de transformação definidos pelo usuário (quando fizer isso, a observação é removida do outro grupo).

SUGESTÃO: Observações coletadas usando diferentes métodos podem ser filtradas, por exemplo, elevações delta. Observações filtradas são temporariamente ocultas, tornando a lista mais curta. Isso facilita a busca de observações. Para maiores informações, consulte Filtrando observações.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	O número designado à observação. A letra "T" precede os números de observações terrestre. A letra "L" precede as observações do nível.
Ponto VA	O nome do ponto de visada atrás da observação.
Ponto do instrum.	O nome do ponto do instrumento da observação.
Ponto FS	O nome do ponto do instrumento da visada adiante.
Grupo de transformação	Esta coluna lhe permite saber se a observação é designada a um grupo de transformação.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas.

NOTA: As observações de nível e de azimute são tratadas como observações terrestres. Para estas observações, considere o Ponto do intrum. com um ponto "de" e o Ponto FS como o ponto "para".


    Diálogo Estratégias de ponderação - Perspectiva Geral

Mais informações

Como ...	Diálogo	Ver também
Perspectiva Geral

O diálogo Estratégias de ponderação lhe permite definir e aplicar estratégias de ponderação a observações GPS, observações terrestres, observações do geóide e Grupos de variância.

Para acessá-lo:

  Selecione Ajuste / Estratégias de ponderação.

O diálogo Estratégias de ponderação contém as guias GPS, Terrestre e Geóide. Cada uma contém uma lista de Observações na qual podem-se visualizar observações incluídas num ajuste de rede. Selecione a guia apropriada para visualizar todas as observações GPS, observações terrestres ou todos pontos para os quais existem separações do geóide.

Cada guia contém as seguintes opções:

Aplicar escalares a

Selecione uma das seguintes opções para definir o método usado para aplicar estratégias de ponderação para observações ou grupos de variância.

Tipo escalar

Selecione uma das seguintes opções para aplicar um escalar para erros estimados usando o método selecionado no grupo Aplicar escalares a. Para maiores informações, consulte Tipo escalar.

Valor escalar

Este campo somente é ativado quando a opção Definido pelo usuário estevir selecionada no grupo Tipo escalar. Insira um valor neste campo para definir e aplicar o valor escalar.

Ao clicar Bloquear, o escalar do ajuste atual é inserido neste campo.

CUIDADO: Use extremo cuidado quando for editar este campo. Princípios gerais sobre a avaliação dos resultados das estratégias de ponderação podem ser encontradas nas estatísticas do relatório das Estratégias de ponderação.

Observações

Monitore esta lista para visualizar o escalar para todas as observações GPS, observações terrestres ou observações para as quais existem separações do geóide. A aparência e conteúdo desta lista muda quando as guias GPS, Terrestre ou Geóide são selecionados. Para maiores informações, consulte os seguintes tópicos:

  Observações (GPS)

  Observações (Terrestres)

  Observações (Geóide)

Grupos

Visualize esta lista para exibir grupos de variância e o valor escalar aplicar a todas as observações do grupo. Esta lista aparece automaticamente quando a guia GPS é selecionada e Aplicar para escalares estiver configurado para Grupos de variância. Para maiores informações, consulte Grupos.

Bloquear

Clique este botão para bloquear o Valor escalar atual.

Bloqueie o Valor escalar uma vez que os ajustes tenham passado pelo teste de Chi-quadrado (fator de referência ~ 1.00) usando o Tipo escalar alternativo. Uma vez que o Valor escalar esteja bloqueado, o Tipo escalar muda automaticamente para Definido pelo usuário e o escalar aparece no campo Valor escalar. O Tipo escalar alternativo não é mais usado.

NOTA: Quando a opção Tipo escalar automático é selecionada e um ajuste automático é efetuado, o Valor escalar bloqueia e o tipo escalar muda para Definido pelo usuário.

O botão Bloquear é desativado quando se usam os tipos Padrão ou Escalar definido pelo usuário.

Aplicar

Clique este botão para aplicar as estratégias escalares de ponderação para a próxima iteração do ajuste. O tipo escalar definido pelo usuário deve ser selecionado para que este botão torne-se disponível.

Filtro

Clique este botão para exibir o diálogo Filtro de observação com opções para filtração de observações. A filtração é útil quando se visualizam grandes números de observações. Todos filtros são removidos automaticamente quando se sai do diálogo. Para maiores informações, consulte Filtrando observações.


    GPS (Estratégias de ponderação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use a guia GPS para visualizar, definir e aplicar estratégias de ponderação para as observações GPS.

Para acessá-la:

1.	Selecione Ajuste / Estratégias de ponderação. Aparece o diálogo Estratégias de ponderação.

2.	Selecione a guia GPS.

Requer-se mais um passo para acessar as estratégias de ponderação para os grupos de variância.

Para acessar as opções do grupo de variância:

  Configure a opção Aplicar escalares a para Grupos de variância.

A aparência do diálogo muda e a lista de Observações é substituída pela lista de Grupos. Grupos de variância podem ser selecionados nesta lista e as estratégias de ponderação podem ser definidas e aplicadas às observações incluídas nos grupos de variância.


Terrestre (Estratégias de ponderação)

Perspectiva geral

Use a guia Terrestre para visualizar, definir e aplicar estratégias de ponderação para observações terrestres. Pode-se também acessar as estratégias de ponderação para grupos de variância.

Para fazer isso:

1.	Selecione Ajuste / Estratégias de ponderação. Aparece o diálogo Estratégias de ponderação.

2.	Selecione a guia Terrestre.

3.	Se desejar acessar as estratégias de ponderação para os grupos de variância, no grupo Aplicar escalares a, selecione a opção Grupos de variância.

A lista Observações torna-se a lista de Grupos e dela pode-se selecionar os grupos de variância apropriados. Pode-se também definir as estratégias de ponderação e aplicá-las às observações incluídas nos grupos de variância.


    Geóide (Estratégias de ponderação)

Mais informações

Como ...	Diálogo	Ver também
Use a guia Geóide para visualizar, definir e aplicar as estratégias de ponderação para as observações geóide.

Para fazer isso:

1.	Selecione Ajuste / Estratégias de ponderação. Aparece o diálogo Estratégias de ponderação.

2.	Selecione a guia Geóide.

Se nenhuma observação aparecer na lista, verifique a guia Geóide do diálogo Observações. Um modelo geóide deve ser designado ao projeto e as separações do geóide devem ser carregadas desde um modelo no projeto.

NOTA: O erro estimado inicial das separações do geóide é o erro padrão do meio do grupo de observações. O software Trimble Geomatics Office computa os meios de todas as separações do geóide no ajuste e então determina o erro padrão do meio para cada separação. Este é somente um ponto inicial para a estimativa de erros na separação do geóide e pode ser necessário fazer uma escala das observações para obter-se um representação verdadeira dos erros estimados.

NOTA: Pode-se mudar o erro padrão aumentando o erro padrão mínimo para separações do geóide no diálogo Estilos de ajuste da rede.


    Aplicar escalares a

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use estes botões para selecionar o método usado para aplicar estratégias de ponderação escalares a observações ou grupos de variância.

As seguintes opções são disponíveis:

Todas observações

Selecione esta opção para aplicar uma só estratégia de ponderação escalar à todas observações ativadas no ajuste da rede de um tipo especificado (GPS, terrestre ou geóide), baseado em erros gerais da rede. Esta é a opção padrão para o ajuste de rede.

Use esta configuração quando todas as medições da rede são efetuadas seguindo os mesmos princípios gerais com o mesmo equipamento. A aplicação de estratégias de ponderação a todas observações é uma prática aceitável quando se trabalha com uma só rede.

Quando um Tipo escalar é configurado para Padrão, um escalar padrão de 1.0 é aplicado a todas observações.

Quando o Tipo escalar é configurado para Alternativa, o fator de referência do grupo do último ajuste multiplicado pelo escalar do último ajuste é aplicado a todas estimativas para todas observações.

Quando o Tipo escalar é configurado para Definido pelo usuário, o cursor aparece no campo Escalar da lista de Grupos, permitindo a entrada de um valor escalar. O valor inserido neste campo é aplicado a todas estimativas de erro para todas observações quando a próxima iteração do ajuste é executada.

Quando um tipo escalar é configurado para Automático, o software efetua um ajuste automático, usando a opção o tipo escalar Alternativo. O software repete o ajuste até passar pelo teste de Chi-quadrado.

Para avaliar os resultados das estratégias de ponderação, consulte a seção Estratégias de ponderação do Relatório de ajuste.

Cada observação

Selecione esta opção para aplicar uma estratégia de ponderação individual para cada vetor ativado incluído no ajuste da rede, baseado no erro de cada vetor.

NOTA: Esta opção somente é disponível na guia GPS.

Use esta configuração para fins de diagnósticos, tais como a localização de más observações numa rede. A Trimble não recomenda que se use este método de aplicação de ponderação escalar para ajustes finais de rede.

Quando o Tipo escalar é configurado para Padrão, um escalar padrão de 1,0 é aplicado à cada observação.

Quando o Tipo escalar é configurado para Alternativo, o fator de referência do grupo da variância do último ajuste, multiplicado pelo escalar do último ajuste, é aplicado à todas estimativas de erro para cada observação.

Para avaliar os resultados de estratégias de ponderação, consulte a seção de Estratégias de ponderação do Relatório de ajuste.

Grupos de variância

Use esta opção para aplicar estratégias de ponderação para todas obserações de um grupo de variância.

NOTA: Esta opção somente é disponível quando as guias GPS ou Terrestre são selecionadas no diálogo Estratégias de ponderação.

Quando esta opção é selecionada, a lista de Observações é substituída pela lista de Grupos, exibindo todos grupos de variância e seus valores escalares.

Quando o Tipo escalar é configurado para Padrão, um escalar padrão de 1,0 é aplicado à todas observações do grupo.

Quando o Tipo escalar é configurado para Alternativo, o fator de referência do grupo do último ajuste multiplicado pelo escalar do último ajuste é aplicado à todas estimativas de erro para as observações do grupo.

Quando o Tipo escalar é configurado para Definido pelo usuário, o cursor aparece no campo Escalar da lista de Grupos, permitindo a entrada de um valor escalar. O valor inserido neste campo é aplicado a todas estimativas de erro para observações do grupo quando a próxima iteração do ajuste é executada.

Quando o tipo escalar é configurado para Automático, o software efetua um ajuste automático, usando a opção do tipo escalar Alternativo. O software repete o ajuste até passar pelo teste de Chi-quadrado.

Para avaliar os resultados das estratégias de ponderação, consulte a seção Estratégias de ponderação do Relatório de ajuste.

Para observações GPS, as opções Todas observações, Cada observação e Grupos de variância são disponíveis. Para observações terrestres, são disponíveis as opções Todas observações e Grupos de variância. Para observações do geóide, somente a opção Todas observações é disponível.

Abaixa são especificadas as combinações possíveis de estratégias de ponderação:

Tipo de escalar	Aplicar escalar para	Lista de escalar
Padrão	Todas observações	Nenhuma estratégia de ponderação é usada
	Cada observação	Nenhuma estratégia de ponderação é usada
	Grupos de variância	Nenhuma estratégia de ponderação é usada
Alternativo	Todas observações	Um só escalar é aplicado globalmente para cada tipo
	Cada observação	Escalares diferentes são aplicados para cada observação
	Grupos de variância	Um só escalar é aplicado para cada grupo
Definido pelo usuário	Todas observações	Um só escalar é aplicado é aplicado globalmente
	Grupos de variância	Um só escalar é aplicado para cada grupo
Automático	Todas observações	Um só escalar é aplicado globalmente
	Grupos de variância	Um só escalar é aplicado para cada grupo


    Tipo Escalar

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use estas opções para selecionar o tipo escalar aplicado a observações GPS, observações terrestres, observações do geóide e grupos de variância.

As seguintes opções são disponíveis:

Padrão

Use esta opção para aplicar um escalar padrão de 1,0 para erros estimados usando o método selecionado na lista Aplicar escalar para.

Use este tipo para a primeira iteração do ajuste. Isso aplica o erro estimado no valor de face, permitindo-lhe analisar os erros na rede. Esta é a configuração padrão para a primeira iteração do ajuste.

NOTA: Quando uma observação é removida do ajuste, deve-se voltar usando o tipo escalar padrão.

NOTA: Quando o escalar padrão é usado para observações GPS, as coordenadas para os pontos "de" são armazenadas e usadas para todos ajustes subseqüentes (até que outro ajuste escalar padrão seja executado) para modelar os vetores no elipsóide.

Para avaliar os resultados de estratégias de ponderação, consulte a seção Estratégias de ponderação do relatório do Ajuste de rede.

Alternativo

Use esta opção para aplicar um escalar computado através da multiplicação do Fator de referência do último ajuste pelo escalar do último ajuste. O valor escalar resultante é aplicado aos erros estimados usando o método selecionado na opção Aplicar escalares a. Isso permite ao software Trimble Geomatics Office computar automaticamente o escalar para a próxima iteração do ajuste.

O escalar definido é aplicado aos erros estimados para cada iteração do ajuste efetuada até que as Estatísticas globais sejam aceitas (isto é, que passem pelo teste de Chi-quadrado). Uma vez que os resultados sejam aceitáveis, bloqueie o valor escalar para descontinuar a aplicação de um novo escalar para cada iteração do ajuste sucessivo.

Para avaliar os resultados de estratégias de ponderação, consulte a seção de Estratégias de ponderação do Relatório de ajuste.

NOTA: Deve-se tentar uma escala alternativa dos erros estimados dos dados estranhos antes de removê-los do ajuste. Isso lhe permite ver se os erros estimados dos dados estranhos são aceitáveis depois de serem escalados. Se uma escala alternativa não resolver os dados estranhos, remova os dados estranhos e retorne a estratégia de ponderação ao tipo escalar padrão.

Cuidado: Quando estiver usando um escalar alternativo, monitore a magnitude do escalar na medida que progrida nas iterações do ajuste. O uso de escalares extraordinariamente grandes para a resolução de dados estranhos não é recomendado.

Definido pelo usuário

Use esta opção para aplicar um escalar definido pelo usuário aos erros estimados usando o método selecionado para a opção Aplicar escalares a.

Este tipo é desativado quando Cada observação é selecionado para a opção Aplicar escalar a.

O tipo é configurado automaticamente quando o botão Bloquear é usado no completamento da escala Alternativa. O último escalar alternativo aplicado ao ajuste é colocado no campo Valor escalar e torna-se um escalar definido pelo usuário.

O hábito de definir escalares manualmente requer um conhecimento profundo de ajustes de quadrados mínimos e medições de levantamento. A Trimble não recomenda este tipo para o usuário inexperiente do software Trimble Geomatics Office. Para maiores informações sobre as medições de levantamento e ajustes de quadrados mínimos, consulte a Bibliografia.

Automático

Quando um tipo escalar é configurado para Automático, o software efetua um ajuste automático, usando a opção do tipo escalar Alternativo (para parar o ajuste a qualquer momento, use a tecla ESC).

O software repete este ajuste até que as estatísticas globais sejam aceitáveis; isto é, até que passe o teste do Chi-quadrado. No entanto, se o teste Chi-quadrado não passar depois de 10 iterações, o ajuste termina e aparece uma mensagem de aviso; você necessitará revisar os dados de entrada usados no ajuste.

Se o ajuste automático for completado com sucesso, o valor escalar bloqueia-se e o tipo escalar torna-se Definido pelo usuário. Um mais ajuste é executado e então pode-se visualizar um relatório do Ajuste da rede. O Relatório Ajuste da rede mostra que o tipo escalar definido pelo usuário foi usado.

NOTA: Se o ajuste automático não for completado com sucesso (isto é, se falhar no teste do Chi-quadrado), o relatório do Ajuste da rede mostra que o tipo escalar alternativo foi usado.

NOTA: Falhas num grupo de dados fazem uma escala maior que o normal das outras observações do ajuste. Portanto, antes de usar o tipo escalar Automático, certifique-se de que todas falhas tenham sido removidas. Pode-se verificar se existem falhas ou dados errados executando o ajuste usando a opção escalar padrão e revisando os resultados.

Depois de usar a opção Tipo escalar Automático, revise os resultados do ajuste com atenção, particularmente os histogramas do ajuste, para garantir que uma falha não permaneceu oculta nas observações.

CUIDADO: A Trimble recomenda que não se use a opção Tipo escalar automático para fazer escalas de observações GPS e terrestres ao mesmo tempo.

Para informações sobre a avaliação de resultados de estratégias de ponderação, consulte a seção Estratégias de ponderação do relatório do Ajuste de rede.

Estas estratégias de ponderação são possíveis usando várias opções:

Tipo de escalar	Aplicar escalar para	Lista de escalar
Padrão	Todas observações	Nenhuma estratégia de ponderação usada
	Cada observação	Nenhuma estratégia de ponderação usada
	Grupos de variância	Nenhuma estratégia de ponderação usada
Alternativo	Todas observações	Um só escalar é aplicado globalmente
	Cada observação	Escalares diferentes são aplicados para cada observação
	Grupos de variância	Um só escalar é aplicado para cada grupo
Definido pelo usuário	Todas observações	Um só escalar é aplicado globalmente
	Grupos de variância	Um só escalar é aplicado para cada grupo
Automático	Todas observações	Um só escalar é aplicado globalmente
	Grupos de variância	Um só escalar é aplicado para cada grupo

Para obter princípios gerais sobre a avaliação de resultados de estratégias de ponderação, consulte a seção Estratégias de ponderação do Relatório de ajuste.


    Observações (Estratégias de ponderação)

Mais informações

 Ver também

Perspectiva geral

Use a Lista de observações para visualizar a estratégia de ponderação usada para cada observação que foi incluída num ajuste de rede. Uma variação desta lista aparece nas guias GPS, Terrestre e Geóide do diálogo Estratégias ponderadas.

No entanto, na guias GPS e Terrestre, quando Aplicar escalar a é configurado para Grupos de variância, a Lista de observações torna-se a lista de Grupos.

Para maiores informações, consulte os seguintes tópicos:

  Observações − observações GPS

  Observações − Observações terrestres

  Observações − Observações do geóide


    Observações (Estratégias ponderadas - GPS)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use esta lista de observações para visualizar as estratégias de ponderação do escalar para todas as observações GPS que foram incluídas numa rede de ajuste. Não pode-se editar nenhuma das informações da lista.

A lista de observações somente é disponível quando Aplicar escalar a está configurado para Todas observações ou Cada observação. Quando Aplicar escalar a é configurado para Grupos de variância, a lista de observações torna-se a lista de Grupos.

SUGESTÃO: Pode-se usar o botão Filtro para filtrar observações coletadas usando diferentes métodos de levantamento. A filtração oculta, temporariamente, algumas observações para tornar mais fácil visualizar outras. Use o campo Tipo para determinar o método de levantamento usado para coletar observações. Para maiores informações, consulte Filtrando observações.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	O número do registro da observação do ajuste da rede. Um ‘B’ aparece no início do registro para mostrar que é uma observação GPS.
Do Pt	O ponto de início da observação.
Para o Pt	O ponto de término da observação.
Escalar	O escalar individual para a observação.
Tipo	O tipo de observação GPS.
Grupo da variância	O grupo de variância designado da observação. Observações GPS individuais somente podem ser designadas para um só grupo de variância; isto é, podem existir vários grupos definidos pelo usuário, mas cada observação somente pode ser designada para um destes grupos.

SUGESTÃO: Nesta lista pode-se mudar o tamanho, mover ou classificar colunas.


    Observações (Estratégias de ponderação - Geóide)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Use esta lista de observações para visualizar as observações do geóide carregadas no projeto. Não pode-se editar qualquer informação da lista de Observações.

A lista de Observações é vazia e um modelo geóide não for selecionado para o projeto, ou se separações do geóide não foram carregadas.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	O número de registro da observação do ajuste da rede. Aparece um "G" no início do registro para mostrar que é uma observação do geóide.
Ponto	O nome do ponto usado para gerar a observação do geóide.
Próximo escalar	O próximo valor escalar que será aplicado à observação.
Separação	A separação do geóide do modelo geóide selecionado.
Erro	O erro estimado na observação do geóide.
Grupo da variância	Mostra se a observação é designada a um grupo de variância. Como somente um grupo de variância pode existir, todas as observações do geóide são designadas ao <Geóide padrão> grupo. NOTA: O grupo <Geóide padrão> sempre será o único grupo da variância do geóide disponível em qualquer ajuste da rede. Como o mesmo método é usado para interpolar para cada observação do geóide do mesmo modelo do geóide, não há necessidade para separá-los em múltiplos grupos.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas da lista.


    Grupos (Estratégias de ponderação)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

A lista de Grupos mostra os grupos de variância e o valor escalar aplicado à todas observações do grupo.

Nas guias GPS e Terrestre do diálogo Estratégias de ponderação, a lista de Grupos torna-se disponível quando Aplicar para escalares é configurado para Grupos da variância. A lista não é disponível na guia Geóide.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Nome do grupo	O nome do grupo de variância. Não pode-se editar as informações desta coluna.
Próximo escalar	O próximo valor do escalar usado para os grupos de variância. Pode-se inserir um valor escalar nesta coluna quando o tipo escalar definido pelo usuário é selecionado. Se o tipo escalar for Padrão ou Alternativo, as informações nesta coluna não podem ser editadas.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas da lista.


Observações (Estratégias de ponderação - Terrestre)

Perspectiva geral

Esta lista somente é disponível quando Aplicar escalar a é configurado para Todas observações. Pode-se usá-la para visualizar as estratégias de ponderação escalar para todas as observações terrestres que estavam no ajuste da rede. No entanto, não pode-se editar nenhum dos seus campos.

SUGESTÃO: Pode-se usar o botão Filtrar para filtrar diferentes tipos de observações. A filtração oculta, temporariamente, algumas observações para facilitar a visualização de outras. Para maiores informações, consulte Filtrando observações.

As seguintes colunas são disponíveis:

Coluna	O que ela mostra
Obs	O número registrado da observação do ajuste da rede. Um "T" aparece no início do registro para mostrar que ele é uma observação terrestre. A letra "N" é usada para indicar observações niveladas.
Ponto VA	O nome do ponto da visada atrás.
Ponto do instrum.	O nome do ponto do instrumento de observação.
Ponto FS	O nome do ponto da visada adiante da observação.
Próximo escalar	O próximo escalar a ser aplicado às observações.
Grupo da variância	O grupo da variância designado da observação. Apesar de que possam existir múltiplos grupos definidos pelo usuário, somente pode-se designar cada observação terrestre a um grupo de variância.

SUGESTÃO: Pode-se mudar o tamanho, mover ou classificar as colunas da lista.

NOTA: As observações de nível e de azimute são tratadas como observações terrestres. Para estas observações, considere o Ponto do intrum. com um ponto "de" e o Ponto FS como o ponto "para".


    Cabeçalho do Ajuste

Mais informações

 Ver também

Perspectiva Geral

Use o Cabeçalho do ajuste, que aparece na parte superior do relatório, para visualizar informações do projeto.

O cabeçalho contém informações coletadas das propriedades do projeto. Uma seção de Conteúdo, com os hyperlinks usados para exibir seções do relatório, aparece no lado esquerdo da tela.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste da rede. O visualizador padrão de HTML inicia e aparece o relatório de Ajuste da rede, com o Cabeçalho do ajuste no alto.

2.	Use os hyperlinks na seção de Conteúdo para procurar o relatório.

Os seguintes campos ou sub-seções são disponíveis:

Projeto

Este campo mostra o nome do projeto.

Nome do usuário

Este campo mostra o nome inserido nas propriedades do projeto.

Data e Horário

Este campo mostra a data e o horário em que o relatório foi gerado.

Sistema de coordenadas

Este campo mostra o sistema de coordenadas selecionado nas propriedades do projeto.

Zona

Este campo mostra a zona do sistema de coordenadas selecionada nas propriedades do projeto. Se um Local de calibração GPS for selecionado, o nome do local é exibido no campo Zona.

Todos os sistemas de coordenadas publicados terão uma zona. O único sistema de coordenadas sem uma zona é a projeção padrão, que exibe "padrão" no campo Zona. O padrão é usado quando se adotam coordenadas de um local, tal como N = 10000, L = 10000 e elev = 100.

Datum do projeto

Este campo mostra o datum do projeto selecionado nas propriedades do projeto. Isto não representa o datum selecionado para o ajuste.

Datum vertical

Pode-se adicionar este campo às informações do cabeçalho do relatório Ajuste da rede. Para exibir o datum vertical usado no projeto, adicione os detalhes necessários no campo Datum vertical no  diálogo Propriedades do projeto – guia Detalhes do projeto.

Modelo do geóide

Este campo mostra o modelo geóide se um modelo foi designado nas propriedades do projeto. Este campo exibe ‘Não selecionado’ quando nenhum modelo do geóide foi designado ao projeto.

Unidades da coordenada

Este campo exibe as unidades do sistema de coordenadas selecionado nas propriedades do projeto.

Unidades de distância

Este campo exibe as unidades da distância selecionado nas propriedades do projeto.

Unidades de altura

Este campo exibe as unidades de altura selecionados nas propriedades do projeto.

Conteúdo

A seção Conteúdo aparece no lado esquerdo da tela e inclui alguns, ou todos, dos seguintes hyperlinks:

  Detalhes do projeto

  Configurações do estilo do ajuste

  Tolerâncias residuais

  Apresentação da covariância

  Controles do ajuste

  Erros de configuração

  Resumo estatístico

  Estatísticas de observação GPS

  Estatísticas do modelo geóide

  Estatísticas do observação terrestre

  Estratégias de ponderação

  Coordenadas ajustadas

  Coordenadas de grid

  Coordenadas geodésicas

  Deltas da coordenada

  Comparações da coordenada de controle

  Observações ajustadas

  Observações GPS

  Observações do geóide

  Observações terrestres

  Histogramas de residuais padronizados

  Elipses de erro do ponto

  Termos de covariante

Selecione os hyperlinks acima para saber mais sobre as seções individuais do relatório.


    Coordenadas Ajustadas

Mais informações

 Ver também

Perspectiva Geral

Use estas estatísticas para visualizar rapidamente:

  Número de pontos

  Número de pontos restritos aso componentes da coordenada

  Valores de coordenadas dos pontos restritos e ajustados

  Erros padrões (estimados) a posteriori de cada ponto do ajuste

  Erros estimados finais

Para acessar as seguintes estatísticas:

1.	Selecione Relatórios / Relatório ajuste da rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, do lado esquerdo da tela, clique Coordenadas ajustadas.

A seção Coordenadas ajustadas começa com um grupo de campos, seguido de tabelas separadas, exibindo:

  Coordenadas de grid ajustadas

  Coordenadas geodésicas ajustadas

  Deltas da coordenadas ajustados

Estas tabelas incluem dados para cada ponto do ajuste da rede.

Estas estatísticas incluem:

Ajuste efetuado em

Este campo identifica o datum usado para efetuar o ajuste de rede. O datum WGS-84 deve ser usado para um ajuste restrito ao mínimo ou ajuste cem observações GPS. Se o datum WGS-84 for selecionado, o campo exibe:

Ajuste efetuado em WGS-84

Ajustes totalmente restritos geralmente são efetuados usando o datum do projeto. O WGS-84 da amostra acima é substituído pelo nome do datum do projeto.

Número de pontos

Este campo enumera o número de pontos incluídos no ajuste da rede.

Número de pontos restritos

Este campo especifica o número de pontos com componentes de coordenadas restritas.

O número de pontos restritos separa-se numa descrição de componentes fixos. Por exemplo:

  Somente horizontal

  Somente altura

  Somente elevação

  Somente horizontal e altura

  Horizontal and elevation only

  Horizontal mais Altura e Elevação

Os campos acima são imediatamente seguidos pelas tabelas seguintes:

  Coordenadas de grid ajustadas

  Coordenadas geodésicas ajustadas

  Deltas de coordenadas ajustados

Para maiores informações sobre a avaliação de dados especificados em cada tabela, consulte os tópicos acima.


    Deltas da coordenada

Mais informações

 Ver também

Perspectiva geral

Esta tabela especifica a magnitude da mudança de coordenada (ajuste) das coordenadas para os  pontos no ajuste mais recente.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste da rede. O visualizador de HTML inicia o relatório de ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, do lado esquerdo da tela, clique Coordenadas ajustadas - Deltas.

Aparecem as estatísticas Deltas de coordenada ajustados.

Estas estatísticas especificam todos os pontos do ajuste e a quantidade de mudança aplicada a cada componente durante o último ajuste. Os deltas são exibidos em unidades lineares, com base nas unidades de coordenadas do projeto selecionadas para o projeto.

Informações de delta da coordenada são mais úteis depois de um ajuste restrito completo e, especialmente quando se avaliam ajustes de irregularidades na magnitude das mudanças.

Estes comandos incluem:

Coluna	Mostra o ajuste (mudança) para …
Nome do ponto	−
ΔNorte	Componente da coordenada Norte
ΔLeste	Componente da coordenada Leste
ΔElevação	elevação da coordenada
ΔAltura	altura elipsoidal da coordenada
ΔSeparação do geóide	separação do geóide se um modelo do geóide for definido e separações forem carregadas no projeto. Este campo fica em branco quando as separações do geóide não estiverem disponíveis.


    Termos de covariante

Mais informações

 Ver também

Perspectiva geral

Estas estatísticas mostram a precisão relativa da linha (termos da covariante) entre pontos do ajuste.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório do ajuste da rede. O visualizador padrão de HTML inicia e aparece o relatório de Ajuste da rede, com o Cabeçalho do ajuste no alto.

2.	No Índice, no lado esquerdo da tela, clique em Termos de covariante.

Aparecem as estatísticas dos Termos de covariante.

O número de termos de covariante exibido varia, dependendo das propriedades Gerais definidas no estilo do ajuste.

  Todas linhas − A remoção da marca das opções Usar reduzir perfil da coluna e Limitar termos de covariante para linhas observadas exibe todos possíveis Azimute, Altura do elipsóide do delta, Distância e elevação do delta, com erros associados ente todos pontos da rede.

  Linhas observadas − A seleção das opções Usar reduzir perfil da coluna e Limitar termos de covariante para linhas observadas exibe todos possíveis azimute, altura do elipsóide do delta, distância e elevação do delta, com erros associados somente para todas as linhas observadas.

Para maiores informações sobre a mudança do conteúdo destas estatísticas, consulte Apresentação da covariância.

Use estas estatísticas de precisão para conhecer o erro relativo em qualquer par de pontos da rede.

As seguintes colunas de tabela são disponíveis:

Coluna	O que ela mostra
Do ponto	O ponto de início para os termos relativos da covariante.
Para ponto	O ponto de término para os termos relativos da covariante.
Componentes	Os componentes da linha relativa entre os pontos.
Erros a-posteriori (   )	O erro a posteriori dos componentes da observação. O nível de confidência selecionado no estilo do ajuste é exibido entre os parânteses e usado para calcular as estimativas a posteriori.
Precisão Horiz. (    )	A precisão bidimensional ou horizontal dos valores de covariância. O método de expressão das precisões (PPM ou Razão) é exibido nos parênteses.
Precisão 3D (    )	A precisão tridimensional dos valores da covariante. O método de expressão de precisões (PPM ou Razão) é exibido entre os parênteses.


    Histogramas para residuais padronizados

Mais informações

 Ver também

Perspectiva geral

Use estes histogramas para visualizar as seguintes informações:

  Distribuição da freqüência de residuais padronizados

  Dados estranhos da observação

  Curva da distribuição normal

  Valor Tau crítico

Para acessar estes histogramas:

1.	Selecione Relatórios / Relatório de ajuste da rede. O visualizador de HTML inicia e aparece o Relatório de ajuste da rede com o Cabeçalho do ajuste em cima.

2.	No Índice, do lado esquerdo da tela, clique em Histogramas de residuais padronizados.

Aparecem os Histogramas de residuais padronizados.

Estes histogramas incluem:

  Combinado − desenho combinado para os residuais padronizados de observações horizontais e verticais

  Horizontal − desenho para os residuais padronizados das observações horizontais

  Vertical − desenho para os residuais padronizados das observações verticais

Os histogramas mostram graficamente a distribuição da freqüência de residuais padronizados da observação do ajuste mais recente. As estatísticas das Observações ajustadas especificam os residuais padronizados para cada observação.

A linha vertical central é um residual zero. Com base na distribuição normal, os menores residuais são agrupados em torno dela e mostram a maior freqüência de residuais desenhados. Os residuais maiores são colocados mais afastados da linha do zero com freqüência que diminui.

Se os residuais do ajuste forem distribuídos aleatoriamente, o desenho da distribuição da freqüência se aproxima à curva de distribuição normal. A curva é sobreposta sobre o desenho de residuais.

As linhas verticais à esquerda e direita da linha do zero mostram o Tau crítico. Todos residuais padronizados fora destas linhas são considerados dados estranhos. A escala da barra representa o valor sigma. O valor sigma combina com o valor Tau nas estatísticas de Observações ajustadas.


    Estatísticas de observação GPS individual

Mais informações

 Ver também

Perspectiva geral

Estas estatísticas mostram a ID de observação, fator de referência e número de redundância (graus de liberdade) de cada observação incluída (usada) no ajuste.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste da rede. O visualizador padrão de HTML inicia e aparece o Relatório de ajuste da rede.

2.	Em Conteúdo, clique Estatísticas de observação GPS.

Vida abaixo algumas amostras de estatísticas:

Ident observação	Fator de referência	Número de redundância
BL1	1,56	2,03
BL2	0,96	1,88
BL3	1,21	1,66
BL4	2,06	1,93

Os seguintes campos são incluídos:

Ident observação

Use este campo para conhecer o número de registro do projeto designado para a observação. O número de registro inclui as letras BL, seguido por um ou mais números.

Fator de referência

Use este campo para saber o quanto o fator de referência para cada informação individual contribui para o fator de referência para as Estatísticas de observação GPS.

NOTA: Os fatores de referência para todas observações individuais são consideradas quando o fator de referência é computado para todas observações GPS. Este último valor, juntamente com o fator de referência para observações do geóide, é usado para computar o fator de referência da rede.

Número de redundância

Use este campo para saber a quantidade de redundância que cada observação GPS contribui para as Estatísticas de observação GPS. Este campo lhe permite saber se a observação GPS individual carece de redundância. O Número de redundância para as Estatísticas de observação GPS, juntamente com o Número de redundância para observações do geóide, é usado para computar os graus de liberdade da rede.

Considere os seguintes princípios gerais:

  Depois de avaliar o fator de referência da rede e os graus de liberdade na seção de Estatísticas globais, avalie estas estatísticas de observação individuais. Todos Fatores de referência devem estar centrados em 1,0.

  Quando estiver avaliando a lista, analise a coerência. Examine todos os extremos muito maiores que ou menores que 1,0. Remova dados estranhos do ajuste para obter mais coerência nas estatísticas do fator de referência individual.

  Números individuais de redundância fornecem uma avaliação da redundância que com a qual cada observação contribui para os Graus de liberdade globais para a rede.

  Todos números devem ser maiores que 0,00 e menores ou iguais a 3,00.

  Mais se aproxima o Número de redundância ao 3,00, com mais redundância contribui a observação para a rede.

  Um número de redundância de 0,00 sugere que a observação somente está conectada a um extremo de outra observação. Em termos de levantamento, esta condição é chamada registro lateral. Se o registro lateral não foi intencional, verifique porque a observação não contribui para a redundância geral da rede.

NOTA: O status de uma observação associada a um registro lateral pode ser configurado para Ativar como verificar.


    Número de iterações

Mais informações

 Ver também

Perspectiva geral

Use a mensagem exibida neste campo para conhecer o número de iterações efetuados para convergir o ajuste com êxito.

Para acessar esta mensagem:

1.	Selecione Relatórios / Relatórios de ajuste da rede. O visualizador padrão de HTML inicia e aparece o relatório de Ajuste da rede com a Cabeçalho de ajuste em cima.

2.	No Índice do lado esquerdo da tela, clique em Resumo estatístico.

Aparece o campo Número de iterações.

Todas as possíveis mensagens aparecem abaixo:

Ajuste bem feito em # iterações

Ajuste bem feito em # iterações (corte de convergência final é usado)

(# = número de iterações)

O número de iterações especificados nunca excede a função Iterações máximas selecionada no diálogo Editar estilo do ajuste.

NOTA: Se um ajuste não converge, um relatório não é criado.


    Observações ajustadas

Mais informações

 Ver também

Perspectiva geral

Use estas estatísticas para obter mais informações sobre observações GPS e de geoid ajustadas:

  Datum usado no ajuste

  Valor do Tau crítico usado no ajuste

  Componentes da observação com seu erro padrão (estimado) a posteriori, residual e residuais padronizados

  Componentes da observação sinalizados como dados estranhos

  Parâmetros de transformação com suas estimativas de erro associadas (ajuste totalmente restrito)

  Um resumo das observações usadas no ajuste e uma lista de todas as observações (GPS, terrestre e geóide).

Use as tabelas de observação de GPS, terrestre e observações do geóide para:

  Verificar o número de observações usadas no ajuste.

  Avaliar os erros padrões a posteriori de cada componente da observação.

  Identificar os componentes de observação que excedam o Tau crítico definido para a rede (dados estranhos). Observações suspeitas (dados estranhos) são realçadas em vermelho.

  Identificar todas as transformações inesperadas e estimativas de grande erro nos parâmetros.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste da rede. A visualizador padrão de HTML inicia e o relatório de ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice do lado esquerdo da tela, clique Observações ajustadas.

Aparecem as estatísticas das Observações ajustadas.

A seção é dividida nas seguintes partes:

  GPS

  Terrestrel

  Geóide

NOTA: Observações podem ser selecionadas na visualização do Levantamento do relatório de ajuste da rede. Para fazê-lo, selecione a Ident observação do relatório de ajuste da rede (para selecionar múltiplas observações, use a tecla Ctrl). Quando uma observação é selecionada no relatório, a seleção atual da visualização do Levantamento é limpada e substituída pelas observações selecionadas do relatório.


    Elipses de erro do ponto

Mais informações

 Ver também

Perspectiva geral

Use estas estatísticas para visualizar uma representação gráfica da magnitude e direção dos erros do ponto (horizontal e vertical). As elipses de erro do ponto mostram graficamente os erros padrões a posteriori da coordenada horizontal de um ponto de ajuste e termo covariante entre pontos.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Reletório de ajuste da rede. O visualizador padrão de HTML inicia e aparece o relatório de Ajuste da rede com o Cabeçalho do ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique Elipses de erro do ponto.

Aparecem as estatísticas das Elipses do erro.

Considere os seguintes princípios gerais:

  O alto da elipse está orientado para o norte.

  Setas à direita de elipse representam os erros padrões a posteriori para as alturas e elevações.

  As escalas da barra que passam através da elipse e seta indicam a magnitude dos erros.

  O valor da marca da escala da barra é exibido nas unidades do projeto juntamente com as elipses do erro. O uso da barra de ferramentas da elipse na janela de gráficos permite editar o valor de marca da escala da barra para ajustar a resolução da escala da barra. A barra de escala da elipse não afeta a escala das elipses de erro do relatório de ajuste da rede.

  A orientação do eixo semi-maior (eixo que indica a direção do maior erro) é mostrada à direita inferior da elipse. Este ângulo é medido em sentido anti-horário a partir da escala da barra leste positiva.

  Os erros padrões para as coordenadas horizontais e verticais são multiplicados pelos escalares sigma bivariados e monovariados, respectivamente.


    Resumo estatístico

Mais informações

 Ver também

Perspectiva geral

Use esta parte do relatório para obter um acesso rápido às seções do resumo estatístico.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, do lado esquerdo da tela, clique Sumário estatístico.

Aparece o Resumo estatístico.

O resumo estatístico é uma ferramenta importante para a análise de resultados do ajuste. As seguintes seções chaves do relatório são acessíveis no resumo:

  Número de iterações

  Estatísticas globais

  Estatísticas para tipos de observação

  Estatísticas para grupos de variância

  Estratégias de ponderação

  Estatísticas individuais da observação GPS

Tipicamente, vai-se diretamente ao resumo estatístico (e especialmente às Estatísticas globais) para analisar os seus resultados gerais quando se efetua um ajuste restrito ao mínimo. O teste de Qui-quadrado, fator de referência da rede e graus de liberdade são indicadores chave para mostrar o quanto a rede está unida.


    Estatísticas de grupos de variância

Mais informações

 Ver também

Perspectiva geral

Use o resumo de Estatísticas do grupo da variância para conhecer o fator de referência e o número de redundância (graus de liberdade) determinados para cada grupo da variância.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, clique Resumo estatístico.

As estatísticas do grupo da variância para cada tipo de observação podem ser visualizadas.

Os seguintes campos são especificados para cada grupo de variância:

Nome do grupo

Este campo mostra o nome do grupo de variância.

Fator de referência

Este campo mostra o quanto cada grupo de variânciacontribui para o fator de referência da rede. Cada grupo de variância possui seus próprios erros de estimativa e, portanto, seu próprio fator de referência.

Número de redundância

Este campo mostra a quantidade de redundância com que cada grupo de variância contribui para os graus de liberdade. Use este campo para saber se o grupo de variância carece de redundância.


    Estratégias de ponderação

Mais informações

 Ver também

Perspectiva geral

Use estas estatísticas para saber se o métódo escalar correto, o tipo escalar e o valor escalar foi aplicado aos grupos de observações GPS, observações do geóide ou grupos da variância.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, clique Estratégias de ponderação.

Aparecem as estatísticas das Estratégias de ponderação.

Resumos separados, consistindo de um Título, Seqüência descritiva e um campo Escalar são gerados para cada grupo de observações GPS, observações terrestres, observações do geóide e grupos de variância. Um resumo amostra para as Observações GPS é mostrado abaixo:

Observações GPS
Grupo escalar padrão aplicado para todas as observações
Escalar: 1,00

O exemplo acima significa que o tipo escalar padrão foi aplicado a todas observações GPS usando o valor escalar 1,0. Abaixo aparecem descrições dos campos que aparecem na seção do relatório de Estratégias de ponderação. Note que várias combinações destes resumos podem aparecer no relatório, dependendo do número dos grupos de operações e do tipo de estratégias de ponderação para grupos de observações.

O relacionamento dos campos Título, Seqüência e Escalar é especificado abaixo:

Título	·	Observações GPS
Seqüência	·	Grupo escalar padrão aplicado para todas as observações
Campo escalar	·	Escalar: 1,00

Título

No exemplo acima, Observações GPS é o título de um grupo de estratégias de ponderação aplicadas a todas observações GPS. Um título para cada tipo de grupo de observação usado no ajuste aparecerá sob a seção de Estratégias de ponderação.

Aplicar escalares a/Tipo de escalar

O primeiro campo do resumo para cada grupo de observação é uma seqüência, representando o tipo de escalar usado juntamente com o método usado para aplicar o escalar a um grupo de observações. Imediatamente segue um título descrevendo o grupo de observações. No exemplo acima, o título ‘Observações GPS’ e a seqüência é ‘Escalar padrão aplicado para todas as observações’.

As palavras ‘Escalar aplicado a’ sempre aparecem na seqüência. Estas palavras são precedidas pela configuração do Tipo escalar e seguidas pela configuração de Aplicar escalares a. Estas configurações são definidas no diálogo Estratégias de ponderação. Possíveis combinações de seqüências para vários grupos de observações são especificadas a seguir:

  Erro escalar aplicados a todas observações

  Escalar alternativo aplicado a todas observações

  Escalar definido pelo usuário aplicado a todas observações

  Erro escalar aplicado à cada observação

  Escalar alternativo aplicado à cada observação

  Escalar padrão aplicado a grupos de variância

  Escalar alternativo aplicado a grupos de variância

  Escalar definido aplicado a grupos de variância

NOTA: A opção do tipo escalar automático executa múltiplas iterações do escalar alternativo. Se o tipo de escalar alternativo for selecionado e o ajuste for concluído com êxito, o escalar definido pelo usuário é exibido nas seqüências enumeradas acima. Se o ajuste automático não for bem sucedido (falhar no teste de Qui-quadrado), o escalar alternativo é exibido nas seqüências enumeradas acima.

Verifique as estratégias de ponderação corretas na seqüência e use o campo Escalar, abaixo, para determinar se o Escalar correto foi aplicado a cada grupo de observações ou grupos de variância.

Campo escalar

O campo Escalar identifica o valor escalar aplicado a cada grupo de observações. Dependendo de quantos grupos de observação possui um ajuste, vários destes campos podem aparecer no relatório. Coletivamente, cada seqüência e valor Escalar representam as estratégias de ponderação aplicadas aos seus respectivos grupos de observações.

Avalie cada um destes campos para saber se os valores Escalares aplicados ao grupo correspondente de observações é justo. Como várias combinações de estratégias de ponderação podem ser definidas para vários grupos de observações, esta seção do relatório pode incluir vários pares de seqüências e de valores escalares. Deve-se avaliar cada grupo de campos como um grupo.


    Coordenadas do grid

Mais informações

 Ver também

Perspectiva geral

Estas estatísticas mostram as coordenadas ajustadas do grid para cada ponto do último ajuste. As coordenadas incluem os erros padrões a posteriori (multiplicados pelo escalar sigma) de uma só dimensão) associado a cada componente da coordenada. O erro de uma só dimensão selecionado no estilo do ajuste é exibido no alto da lista de Coordenadas.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, do lado esquerdo da tela, clique Coordenadas ajustadas − Grid.

Aparecem as estatísticas de coordenadas do grid.

As seguintes colunas são incluídas:

Coluna	O que ela mostra
Nome do ponto	O nome do ponto descrito nas colunas restantes.
Norte	O componente Norte ajustado do ponto, em unidades do sistema de coordenadas.
Erro N	O erro computado para o componente norte ajustado, em unidades do projeto.
Leste	O componente Leste ajustado do ponto, em unidades do sistema de coordenadas.
Erro L	O erro computado para o componente Leste ajustado, em unidades do sistema de coordenadas.
Elevação	O componente de coordenada da elevação ajustado para o ponto, em unidades do projeto.
erro e	O erro computado para o componente da coordenada de Elevação ajustado, em unidades do projeto.
Fixo	Os pontos restritos ao ajuste e o componente restrito da coordenada. Componentes restritos da coordenada incluem somente horizontal (2D), somente vertical (Altura ou Elevação) ou horizontal e vertical.
Os seguintes códigos aparecem na coluna Fixo para identificar os componentes:

Código	Significa
N L	Horizontal 2D
a	Altura
e	Elevação
NOTA: Todos pontos restritos podem não contar com erros padrões a posteriori associados aso componentes da coordenada. Estes erros são exibidos como 0,000. Se nenhum valor estiver disponível para um componente ou os erros a posteriori associados, na coluna aparece N/A.


    Coordenadas geodésicas

Mais informações

 Ver também

Perspectiva geral

Use esta tabela de estatísticas para visualizar as coordenadas geodésicas ajustadas de cada ponto do último ajuste. As coordenadas incluem os erros padrões a posteriori, multiplicados pelo escalar sigma de uma só dimensão, associado com cada componente da coordenada.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice na esquerda da tela, clique Coordenadas ajustadas − Geodésico.

Aparecem as estatísticas das Coordenadas geodésicas.

As seguintes colunas são incluídas:

Coluna	O que ela mostra
Nome do ponto	O nome do ponto descrito nas colunas restantes.
Latitude	O componente ajustado da coordenada de latitude do ponto no datum de ajuste.
Erro N	O erro computado para o componente de coordenada de latitude, em unidades do projeto.
Longitude	O componente ajustado da coordenada de longitude do ponto no datum de ajuste.
Erro L	O erro computado para o componente da coordenada de longitude, em unidades do projeto.
Altura	A Altura ajustada acima do componente de coordenada do Elipsóide para o ponto, em unidades do projeto.
erro a	O erro computado para a Altura acima do componente de coordenada do Elipsóide, em unidades do projeto.
Fixo	O pontos restritos no ajuste e o componente restrito da coordenada. Componentes restritos da coordenada incluem somente horizontal (2D), somente vertical (Altura do elipsóide ou Elevação) ou horizontal e vertical.
Os seguintes códigos aparecem na coluna Fixo para identificar os componentes:

Código	Significa
Lat Long	Horizontal 2D
a	Altura
e	Elevação
NOTA: Nem todos pontos restritos podem ter erros padrões a posteriori associados aos componentes da coordenada. Estes erros são exibidos como 0,000. Se nenhum valor estiver disponível para um componente ou erros a posteriori associados, na coluna aparece N/A.


    Estatísticas globais

Mais informações

 Ver também

Perspectiva geral

As seguintes estatísticas mostram o quanto a rede está integrada.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	Na tabela de Conteúdo, no lado esquerdo da tela, clique Resumo estatístico.

Aparecem as Estatísticas globais.

Abaixo segue uma seção amostra de relatório:

Fator de Referência da Rede :	6,42
Teste do Qui-Quadrado (a=95%) :	FALHA
Graus de liberdade         :	36,00

Os seguintes campos são incluídos:

Fator de Referência da Rede

Este valor lhe permite saber o quanto os erros de ajuste a priori (prá-ajuste) combinam com os erros a posteriori (pós-ajuste).

O fator de referência da rede é útil para saber se erros aleatórios nas observações são aceitáveis e se combinam com os erros padrões estimados para estas observações. O fator de referência da rede deve ser aproximadamente igual a 1,0.

Teste do Qui-quadrado

Este valor lhe permite saber o quanto a rede de ajuste é integrada. Se o fator de referência está próximo a 1,0 e se os graus de liberdade são aceitáveis e a rede está integrando-se matematicamente e se passou no teste de Qui-quadrado.

Quando um ajuste de quadrados mínimos é bem sucedido, o fechamento matemático da rede é um fator importante. Considere o teste de Qui-quadrado como sendo o primeiro indicador de fechamento matemático.

Graus de liberdade

Este valor lhe permite conhecer a quantidade geral de redundância na rede. Graus de liberdade identificam o número de observações independentes incluídas no ajuste usadas para sobre determinar soluções. Maior o número, mais redundâncias haverão no ajuste.

Os números de redundância para observações GPS, observações GPS e observação do geóide são usadas coletivamente para determinar este valor geral de graus de liberdade para a rede.


    Estatísticas para tipos de observação

Mais informações

 Ver também

Perspectiva geral

Use estas estatísticas para conhecer o fator de referência (RF) e número de redundância (graus de liberdade) determinado para cada tipo de observação; isto é, GPS, terrestre e geóide.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

No Índice, no lado esquerdo da tela, clique Resumo estatístico.

Aparece a seção de Estatísticas de observação GPS, Estatísticas de observação terrestre ou Estatísticas de observação góide.

As Estatísticas do modelo geóide são disponíveis depois de carregar as observações do geóide.

Para maiores informações, consulte os seguintes tópicos:

  Estatíticas de observação GPS

  Estatíticas de observação terrestre

  Estatíticas de observação geóide


    Estatísticas de observação GPS

Mais informações

 Ver também

Perspectiva geral

Visualize o Fator de referência e o Número de redundância (Graus de liberdade) determinados para as observações GPS no resumo de Estatísticas de observação GPS das estatísticas para tipos de observações.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique em Resumo estatístico − Observação GPS.

As Estatísticas para os Tipos de observação GPS aparecem com a Estatísticas de observação GPS aparecendo no alto da seção.

Os seguintes campos são especificados:

Fator de referência

Cada tipo de observação possui seus próprios erros estimados, portanto, seu próprio fator de referência. Este valor mostra o quanto cada tipo de observação contribui para o fator de referência da rede. O software Trimble Geomatics Office lhe permite trabalhar com cada método de observação (GPS, terrestre ou geóide) separadamente para ponderar cada grupo de observação independentemente e aplicar a quantidade apropriada de escala às estimativas de erro de cada grupo.

Número de redundância

O Número de redundância, às vezes chamado de graus de liberdade, é um indicador de quanto cada observação contribui para a redundância geral. Use esta estatística para identificar quais observações estão carentes de redundância.

Estatísticas do grupo de variância GPS

Os seguintes campos são especificados para cada grupo de variância:

  Nome do grupo

  Fator de referência − Este campo mostra o quanto cada grupo de variância contribui para o fator de referência da rede. Cada grupo de variância possui seus próprios erros estimados e, portanto, o seu próprio fator de referência.

  Número de redundância  − Este campo mostra com quanta redundância contribui cada grupo de variância aos graus de liberdade da rede. Use este campo para verificar se o grupo de variância carece de redundância.

Estatísticas de observação GPS individual

Os seguintes campos são especificados para observação GPS:

  Ident observação

  Fator de referência − Este campo mostra com quanto contribui cada observação GPS ao fator de referência da rede. Cada observação GPS possui seus dois erros estimados e, portanto, seu próprio fator de referência.

  Número de redundância − Este campo mostra com quanto contribui cada observação de GPS aos graus de liberdade da rede. Um grande número indica mais redundância. Use este campo para verificar se uma observação GPS carece de redundância.


Estatísticas de observação terrestre

Perspectiva geral

Para verificar o fator de referência e número de redundância (graus de liberdade) determinado para as observações terrestres, use o resumo de Estatísticas de observação terrestre das estatísticas para tipos de observação.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho de ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique Resumo estatístico − Observação terrestre.

Aparece a seção de Estatísticas da observação terrestre.

Os seguintes campos são especificados:

Fator de referência

Cada tipo de observação possui seus próprios erros estimados, portanto, seu próprio fator de referência. Este valor mostra o quanto cada tipo de observação contribui para o fator de referência da rede. O software Trimble Geomatics Office lhe permite trabalhar com cada método de observação (GPS, terrestre ou geóide) separadamente para ponderar cada grupo de observação independentemente. Pode-se então aplicar a quantidade apropriada de escala às estimativas de erro de cada grupo.

Número de redundância

O Número de redundância, às vezes chamado de graus de liberdade, é um indicador de quanto cada observação contribui para a redundância geral. Use esta estatística para identificar quais observações estão carentes de redundância.

Estatísticas terrestres por tipo

Se os seguintes tipos de observações estiverem presentes no ajuste, os seus fatores de referência e números de redundância são mostrados:

  Ângulos horizontais

  Elevações trigonométricas

  Distâncias do elipsóide

  Elevações do delta

  Azimutes

Estatísticas do grupo da variância terrestre

Os seguintes campos são especificados para cada grupo de variância:

  Nome do grupo

  Fator de referência − Este campo mostra o quanto cada grupo de variância contribui para o Fator de referência da rede. Cada grupo de variância possui seus próprios erros estimados e, portanto, seu próprio Fator de referência.

  Número de redundância − Este campo mostra com quanta redundância cada grupo de variância contribui para os graus de liberdade da rede. Use este campo para verificar se um grupo de variância carece de redundância.


    Estatísticas do modelo geóide

Mais informações

 Ver também

Perspectiva geral

Use o resumo das Estatísticas da observação geóide de Estatísticas para tipos de observação para conhecer o fator de referência e número de redundância (graus de liberdade) determinados pelas observações do geóide.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique no Resumo estatístico − Modelo Geóide.

Aparece Estatísticas do modelo geóide.

Os seguintes campos são especificados:

Fator de referência

Cada tipo de observação possui seus próprios erros estimados, portanto, seu próprio fator de referência (FR). Este valor mostra o quanto cada tipo de observação contribui para o fator de referência da rede. O software Trimble Geomatics Office lhe permite trabalhar com cada método de observação (GPS, terrestre ou geóide) separadamente para ponderar cada grupo de observação independentemente e, então, aplicar a quantidade apropriada de escala às estimativas de erro de cada grupo.

Número de redundância

O Número de redundância, chamado graus de liberdade para um rede geral, é um indicador de quanto cada observação contribui para a redundância geral. Use esta estatística para identificar quais observações estão carentes de redundância.


    Observações GPS ajustadas

Mais informações

 Ver também

Perspectiva geral

Use as observações da tabela de Observações GPS ajustadas para:

  Verificar o número de observações GPS usadas no ajuste.

  Avaliar os erros padrões a posteriori de cada componente de observação.

  Identificar os componentes GPS que excedem o Tau crítico definido para a rede (dados estranhos). Observações suspeitas são realçadas em vermelho para ajudar identificar os dados estranhos.

  Identificar qualquer transformação inesperada e estimativas de grandes erros em parâmetros.

Estes campos podem preceder a tabela de Observações GPS ajustadas:

NOTA: Campos do Parâmetro de transformação são especificados com base no status do parâmetro. O status do parâmetro produzirá os seguintes valores especificados:

Não usado − Um parâmetros configurado para o status Não usado resultará quando valores não forem especificados.

Definido pelo usuário − Um parâmetro configurado para o status Definido pelo usuário aparece como o valor configurado pelo usuário independente do número de componentes restritos da coordenada.

Computado − Um parâmetro configurado para o status Computado aparecerá depois da restrição do número requerido de componentes da coordenada.

Para maiores informações sobre a definição de computação de parâmetros de transformação, consulte Parâmetros de transformação – Perspectiva geral .

Para acessar estas estatísticas:

  Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho de ajuste em cima.

No Índice, no lado esquerdo da tela, clique Observações ajustadas − GPS

Aparecem as estatísticas de Observações GPS ajustadas.

As seguintes estatísticas são incluídas:

Grupo de transformação GPS

Este campo mostra o nome de cada grupo de transformação incluídos no ajuste. Este campo também serve como um cabeçalho para distinguir as informações especificadas para cada grupo de transformação um do outro.

Desvio em longitude

Estes campos mostram o Valor e erro estimado do parâmetro do Desvio em longitude. Este valor é computado e especificado quando um mínimo de três alturas e um ponto 2D é fixo.

NOTA: Isso varia de um grupo de transformação do geóide, onde um requerimento mínimo de seis alturas (3 alturas ortométricas e 3 elipsóides) e um ponto 2D são fixos.

Desvio em latitude

Estes campos mostram o Valor e erro estimado do parâmetro do Desvio em latitude. Este valor é computado e especificado quando um mínimo de três alturas e um ponto 2D são fixos.

NOTA: Isso varia de um grupo de transformação do geóide, onde um requerimento mínimo de seis alturas (3 alturas ortométricas e 3 elipsóides) e um ponto 2D são fixos.

Rotação do azimute

Estes campos mostram o Valor e erro estimado do parâmetro da Rotação do azimute. Este valor é computado e especificado quando um mínimo de dois pontos 2D são fixos.

Escala da rede

Estes campos mostram o Valor e erro estimado do parâmetro da Escala da rede. Este valor é computado e especificado quando um mínimo de uma altura e dois pontos 2D são fixos.

Escala da distância

Estes campos mostram o Valor e erro estimado do parâmetro da Escala distância. Este valor é usado para eliminar um erro sistemático em distâncias.

Constante da distância

Estes campos mostram o Valor e erro estimado do parâmetro da Constante da distância. Este valor é usado para eliminar um erro sistemático em distâncias.

Constante da altura

Estes campos mostram o Valor e erro estimado do parâmetro da Constante da altura. Este parâmetro elimina erros sistemáticos em alturas.

Número de observações

Este campo mostra o número total de observações GPS incluídas no ajuste.

Número de dados estranhos

Este campo mostra o número total de dados estranhos (observações GPS com altos residuais) encontrados no ajuste.

Ajuste da observação (Tau crítico = #)

Este campo mostra o valor do Tau crítico usado no ajuste. Este campo é imediatamente seguido pela tabela de Observações GPS ajustadas.

As seguintes colunas são incluídas na tabela de Observações GPS ajustadas:

Coluna	O que ela mostra
Ident observação	O nome do registro designado à observação do projeto. Para Observações GPS, o número da ID é precedido pelo caractere "B".
Do ponto	O nome do ponto de início.
Para ponto	O nome do ponto de término.
Observações	Os valores ajustados para os componentes da observação GPS.
Erro a posteriori (Valor sigma)	O erro a posteriori estimado para os componentes da observação GPS. O escalar sigma configurado no estilo do ajuste é exibido no cabeçalho da coluna.
Residual	A observação residual para os componentes da observação GPS.
Residual pad.	O residual padronizado para os componentes da observação GPS. O residual padronizado lhe permite comparar diretamente os erros de uma medição angular com os erros de uma medição linear.


Observações do terrestres ajustadas

Mais informações

 Ver também

Perspectiva geral

Use as observações da tabela de Observações terrestres ajustadas para fazer o seguinte:

  Verificar o número de observações terrestres usadas no ajuste.

  Avaliar os erros padrões a posteriori de cada componente da observação.

  Identificar os componentes de observação terrestres que excedam o Tau crítico definido para dados estranhos da rede. Observações suspeitas são realçadas em vermelho para ajudar identificar os dados estranhos.

  Identificar todas as transformações inesperadas e estimativas de grande erro nos parâmetros.

Os seguintes campos podem preceder a tabela de Observações terrestres ajustadas:

NOTA: Campos do Parâmetro de transformação são especificados com base no status do parâmetro. O status do parâmetro produz os seguintes valores especificados:

  Não usado − não fornece valores especificados

  Definido pelo usuário − aparece como o valor configurado pelo usuário, independentemente do número de componentes restritos da coordenada

  Computado − aparecerá depois que o número requerido de componentes da coordenada seja restrito.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho de ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique Observações ajustadas − Terrestre. Aparecem as estatísticas das Observações ajustadas.

As seguintes estatísticas são incluídas:

Grupo de transformação terrestre

Este campo mostra o nome de cada grupo de transformação incluídos no ajuste. Este campo também serve como um cabeçalho para distinguir as informações especificadas para cada grupo de transformação um do outro.

Desvio em longitude

Estes campos mostram o Valor e erro estimado do parâmetro do Desvio em longitude. Este valor é computado e especificado quando um mínimo de três alturas e um ponto 2D é fixo.

NOTA: Isso varia de um grupo de transformação do geóide, onde um requerimento mínimo de seis alturas (3 alturas ortométricas e 3 elipsóides) e um ponto 2D são fixos.

Desvio em latitude

Estes campos mostram o Valor e erro estimado do parâmetro do Desvio em latitude. Este valor é computado e especificado quando um mínimo de três alturas e um ponto 2D são fixos.

NOTA: Isso varia de um grupo de transformação do geóide, onde um requerimento mínimo de seis alturas (3 alturas ortométricas e 3 elipsóides) e um ponto 2D são fixos.

Rotação do azimute

Estes campos mostram o Valor e erro estimado do parâmetro da Rotação do azimute. Este valor é computado e especificado quando um mínimo de dois pontos 2D são fixos.

Escala da rede

Estes campos mostram o Valor e erro estimado do parâmetro da Escala da rede. Este valor é computado e especificado quando um mínimo de uma altura e dois pontos 2D são fixos.

Escala da distância

Estes campos mostram o Valor e erro estimado do parâmetro da Escala distância. Este valor é usado para eliminar um erro sistemático em distâncias.

Constante da distância

Estes campos mostram o Valor e erro estimado do parâmetro da Constante da distância. Este valor é usado para eliminar um erro sistemático em distâncias.

Constante da altura

Estes campos mostram o Valor e erro estimado do parâmetro da Constante da altura. Este parâmetro elimina erros sistemáticos em alturas.

Número de observações

Este campo mostra o número total de observações terrestres incluídas no ajuste.

Número de dados estranhos

Este campo mostra o número total de dados estranhos (observações terrestres com altos residuais) encontrados no ajuste.

Ajuste da observação (Tau crítico = #)

Este campo mostra o valor do Tau crítico usado no ajuste. Este campo é imediatamente seguido pela tabela de Observações GPS ajustadas.

As seguintes colunas são incluídas na tabela de Observações terrestres ajustadas:

Coluna	O que ela mostra
Ident observação	O nome do registro designado à observação do projeto. Para observações terrestres, o número de Ident. é precedido pelo caractere "T".
Ponto de visada atrás	O nome do ponto de visada atrás.
Ponto ocupado	O nome do ponto ocupado.
Ponto de visada adiante	O nome do ponto de visada adiante.
Observação	Os valores ajustados para os componentes da observação terrestre.
Erro a posteriori (valor sigma)	O erro estimado a posteriori para os componentes da observação terrestre. O escalar sigma configurado no estilo do ajuste é exibido no cabeçalho da coluna.
Residual	O residual da observação para os componentes da observação terrestres.
Residual pad.	O residual padronizado para os componentes de observação terrestre. O residual padronizado lhe permite comparar diretamente os erros de uma medição angular com os erros de uma medição linear.


    Observações do geóide ajustadas

Mais informações

 Ver também

Perspectiva geral

Use estas estatísticas para examinar estas informações sobre as informações do geóide ajustadas.

  Valor Tau crítico usado no ajuste.

  Observações do geóide com seu erro padrão (estimado) a posteriori, residual e residuais padronizados associados.

  Observações do geóide sinalizadas em vermelho como sendo dados estranhos

  Parâmetros de transformação com suas estimativas de erro associadas (ajuste totalmente restrito)

  Um resumo das observações geóide usadas no ajuste e uma tabela contendo informações sobre todas as observações do geóide

Use as observações da tabela Observações do geóide ajustadas para:

  Verificar o número de observações geóide usadas no ajuste.

  Avalie os erros padrões a posteriori de cada observação.

  Identifique as observações do geóide que excedem o Tau crítico definido para a rede (dados estranhos). Observações suspeitas são realçadas em vermelho para ajudar identificar dados estranhos.

  Identifique todas transformações inesperadas e estimativas de grandes erros nos parâmetros.

Os seguintes campo podem preceder as Observações do geóide:

NOTA: Campos do Parâmetro de transformação são especificados com base no status do parâmetro. O status do parâmetro produz os seguintes valores especificados:

Não usado − Um parâmetro configurado para o status Não usado resultará quando valores não forem especificados.

Definido pelo usuário − Um parâmetro configurado para o status Definido pelo usuário aparece como o valor configurado pelo usuário independente do número de componentes restritos da coordenada.

Computado − Um parâmetro configurado para o status Computado aparecerá depois da restrição do número requerido de componentes da coordenada.

Ver Parâmetros de transformação − Perspectiva geral (Hyperlink) para maiores informações sobre a definição e computação dos Parâmetros de transformação.

Para acessar estas estatísticas:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório Ajuste da rede aparece com o Cabeçalho do ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique Observações ajustadas − Geóide. As estatísticas das Observações do geóide são exibidas.

As seguintes estatísticas são disponíveis:

Grupo transformação do geóide

Este campo mostra o nome do grupo de transformação incluído no ajuste. Como somente existe o grupo de transformação padrão, esta parte da seção do relatório sempre especificará o grupo de transformação <Geóide padrão>.

Desvio em longitude

Estes campos mostram o Valor e erro estimado do parâmetro do Desvio em longitude. Para os grupos de transformação do geóide, este valor é computado e especificado quando um mínimo de seis alturas (3 alturas ortométricas e 3 elipsóides) e um ponto 2D são fixos. Isso varia da transformação GPS, onde um mínimo requerido são três alturas e um ponto 2D são fixos.

Desvio em latitude

Estes campos mostram o Valor e erro estimado do parâmetro do Desvio em latitude. Para grupos de transformação do geóide, este valor é computado e especificado quando um mínimo de seis alturas (3 alturas ortométricas e 3 elipsóides) e um ponto 2D são fixos. Isso varia da transformação GPS, onde um mínimo requerido são três alturas e um ponto 2D são fixos.

Constante da altura

Estes campos mostram o Valor e erro estimado do parâmetro da Constante da altura. Este valor é computado e especificado quando um mínimo de uma elevação e uma altura são fixos.

Número de observações

Este campo mostra o número total de observações geóide incluídas no ajuste.

Número de dados estranhos

Este campo mostra o número total de dados estranhos (observações GPS com altos residuais) encontrados no ajuste.

Ajuste da observação (Tau crítico = #)

Este campo mostra o valor do Tau crítico usado no ajuste. Este campo é imediatamente seguido pela tabela de Observações Geóide ajustadas.

As seguintes colunas são incluídas na tabela de Observações Geóide ajustadas:

Coluna	O que ela mostra
Ident observação	O nome do registro designado à observação do geóide no projeto. Para Observações Geóide, o número da ID é precedido pelo caractere "B".
Nome do ponto	O nome dos pontos usados para extrair observações geóide do modelo geóide.
Separação	O valor ajustado.
Erro a-posteriori  (valor sigma)	O erro a posteriori estimado. O escalar do sigma configurado no estilo do ajuste é exibido no cabeçalho da coluna.
Residual	O residual da observação.
Residual padr.	O residual padronizado. O residual padronizado lhe permite comparar diretamente os erros de uma medição angular com os erros de uma medição linear.
NOTA: Se as correlações forem computadas para o geóide, todas as separações ajustadas terão residuais. Se as correlações não forem computadas, somente pontos com restrições verticais terão residuais do geóide.


Configurações do estilo do ajuste

Perspectiva geral

Nesta seção do relatório é visualizado um resumo das configurações feitas para o ajuste da rede. Para acessar as configurações do estilo do ajuste:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho em cima.

2.	No Índice, no lado esquerdo da tela, clique em Configurações do estilo de ajuste.

Aparecem as seguintes configurações do estilo do ajuste:

Tolerâncias residuais

As configurações das tolerâncias residuais são mostradas para os seguintes valores:

  Para terminar iteração

  Corte da convergência final

Apresentação da covariância

Aparecem as seguintes informações dos Parâmetros de erro horizontal:

  Erro linear propagado [E]

  Termo constante [C]

  Escala sobre erro linear [S]

Aparecem as seguintes informações relacionadas aos parâmetros tridimensionais:

  Erro linear propagado [E]

  Termo constante [C]

  Escala sobre erro linear [S]

A seção também mostra se a opção Usar erros de elevação, se disponíveis foi selecinada.

Controles do ajuste

Aparecem as seguintes informações:

  Computar correlações para o geóide

  Se um ajuste horizontal ou vertical (ou ambos) foi efetuado.

NOTA: Esta seção somente aparece se o ajuste inclui observações terrestres.

Erros de configuração

Aparecem os seguintes erros de configuração GPS:

  Erro na altura da antena

  Erro de centramento

Aparecem os seguintes erros de configuração terrestre:

  Erro na altura do instrumento

  Erro de centramento

NOTA: Os erros de configuração terrestre somente são especificados se observações terrestres forem incluídas no ajuste.

Para maiores informações sobre as configurações dos Erros de configuração, consulte Erros de configuração.


Diálogo Configuração do relatório de ajuste da rede

Perspectiva geral

Use este diálogo para selecionar as informações exibidas no relatório de ajuste da rede.

Para fazê-lo:

  Selecione Relatórios / Configurar / Relatório de ajuste da rede. Aparece o diálogo Configuração do relatório de ajuste da rede.

Os itens que podem ser exibidos no relatório de ajuste da rede são:

  Estatísticas de observação GPS individual

  Coordenadas de grid ajustadas

  Coordenadas geodésicas ajustadas

  Deltas da coordenada

  Comparações da coordenada de controle

  Elipses de erro do ponto

  Termos de covariante

NOTA: Para grandes projetos, a geração visualizações de Elipses de erro do ponto e Termos de covariante tomam muito tempo. Desative estas opções no diálogo Configuração do relatório de ajuste da rede para gerar relatórios mais rapidamente.


Comparações da coordenada de controle

Perspectiva geral

Quando se efetua um ajuste de um ponto que possui coordenadas de qualidade de Controle sem restrições, o relatório de Ajuste da rede mostra a diferença entre as coordenadas do ponto de controle sem restrições e as coordenadas do ponto de controle ajustadas.

Para visualizar as comparações da coordenada de controle:

1.	Selecione Relatórios / Relatório de ajuste de rede. O visualizador padrão de HTML inicia e o relatório de Ajuste da rede aparece com o Cabeçalho de ajuste em cima.

2.	No Índice, no lado esquerdo da tela, clique Comparações da coordenada de controle.

As comparações da coordenada de controle são exibidas numa tabela com os seguintes campos:

Nome do ponto

Name do ponto com uma qualidade de controle.

Valores delta

A diferença entre as coordenadas de controle sem restrições e as coordenadas de contole ajustadas são mostradas para:

  Norte do delta

  Leste do delta

  Elevação do delta

  Altura do delta

NOTA: As diferenças são mostradas como:

Diferença da coordenada de controle = coordenada de controle − Coordenada ajustada


    Comando de Ajuste

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para executar um ajuste de rede.

Antes de usar este comando, assegure-se de que todas as Configurações de estilo de ajuste estejam corretas, coordenadas de ponto de controle estejam configuradas, e observações estejam disponíveis.

Para executar um ajuste, faça um dentre os seguintes:

  Selecione Ajuste / Ajustar.

  Pressione F10.

O ajuste inicia.

Após cada repetição de ajuste, um resíduo de observação é computado usando duas rotinas de software diferentes. A diferença das duas computações são comparadas com a tolerância de Iterações Para Fim. Baseado nessa comparação, uma das seguintes ações ocorre:

  Se a diferença entre os resíduos de observação computados é menor que a tolerância de Iterações Para Fim, as iterações de ajuste param. Uma mensagem é incluída no relatório de Ajuste de rede declarando "Ajuste bem feito em # iterações", onde ## é o número de iterações requerido para convergir a rede.

  Se a diferença entre os resíduos de observação computados for maior que a tolerância de Iterações Para Fim, as iterações de ajuste continuam. Se o ajuste continua até atingir as Iterações Máximas, a Interrupção da Convergência Final é usada (veja abaixo).

Digite a tolerância de interrupção de convergência para a iteração final do ajuste de rede. O software usa este valor para determinar se o ajuste de rede é bem feito quando a iteração final não passa a tolerância de Iterações Para Fim.

Se a diferença computada em resíduo de observação para a última iteração de ajuste for maior que a tolerância de Iterações Para Fim, o resíduo é comparado com a Interrupção de Convergência Final e uma dentre estas ações ocorre:

  Se a diferença entre o resíduo de observação computado for menor que a Interrupção de convergência final, o ajuste é bem feito e uma mensagem é exibida declarando "Convergência final bem feita após ## iterações (interrupção de convergência final usada)", onde ## é o número de iterações requerido para convergir a rede.

  Se o resíduo de observação for maior que a Interrupção de convergência final, o ajuste falha e um diálogo de aviso aparece declarando "Ajuste falho. Não há Convergência".

Para mais informações sobre o processo de ajuste de rede, veja Ajuste de rede.

Para mais informações sobre as iterações e computações executadas durante o processo, veja Tolerâncias de Resíduo.


    Comando de Estilos de Ajuste

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para visualizar, criar, copiar, editar, renomear, e apagar estilos de ajuste.

Para visualizar o diálogo Estilos de Ajuste de rede:

  Selecione Ajuste / Estilos de Ajuste.


    Comando Datum

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para escolher o datum usado no ajuste.

Para visualizar o submenu Datum:

  Selecione Ajuste / Datum.

O submenu Datum aparece com estes comandos:

  WGS-84

  Datum do Projeto


    Comando de Grupos de Observação

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para definir os grupos de variância e transformação usados no ajuste.

Para visualizar o submenu de grupos de observação:

  Selecione Ajuste / Grupos de observação.

O submenu de grupos aparece com estes comandos:

  Grupos de variância

  Grupos de transformação


    Comando Relatório de Ajuste de Rede

Mais informações

Como ...	Relatório	Veja também
Perspectiva geral

Selecione este comando para visualizar o relatório Ajuste de rede.

Para visualizar o relatório Ajuste de rede:

  Selecione Relatórios / Relatório Ajuste de rede. O relatório é gerado em formato HTML e o visualizador de HTML padrão para o computador é automaticamente aberto para exibir os dados de relatório.

Para mais informações sobre o relatório, veja relatório Ajuste de rede.


    Comando Observações

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para visualizar e avaliar observações. Este comando também deixa você incluir ou excluir observações desde o ajuste de rede.

Para visualizar o diálogo Observações:

  Selecione Ajuste / Observações.


    Comando Pontos

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para abrir o diálogo Pontos, com opções para visualizar, configurar, e desmarcar o status Fixo dos componentes da coordenada do ponto de controle usados em um ajuste de rede:

Para visualizar o diálogo Pontos:

  Selecione Ajuste / Pontos.


    Comando Datum do Projeto

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para selecionar o datum do projeto como o datum usado no ajuste. O datum do projeto é configurado na guia Sistema de Coordenadas do diálogo Propriedades do Projeto. O datum do projeto é usado quando você estiver executando um ajuste totalmente limitado, ou um ajuste minimamente limitado em dados terrestres.

Para selecionar o datum do projeto:

  Selecione Ajuste / Datum / Datum do projeto − <datum>. Uma marca de verificação aparece próximo ao Datum do projeto − <datum>.


    Comando Remover Ajuste

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para remover o ajuste atual.

Para remover valores ajustados:

  Selecione Ajuste / Remover ajuste.

Use esta opção para retornar sua rede à configuração que você tinha antes do ajuste. Por exemplo, quando usar esse comando:

  o datum é configurado para WGS-84

  nenhum ponto tem um status fixo

  elipses de erro são removidas

  observações geóides são descarregadas

  escalares são restauradas para Todas as Observações e opções padrão.

NOTA: Observações que foram desativadas para ajuste, e aquelas para as quais o Usar na caixa de verificação ajuste de rede foi desmarcado, não são restauradas ao estado prévio.


    Comando Grupos de transformação

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para definir os grupos de transformação de observação usados no ajuste.

Para visualizar o diálogo Grupos de transformação:

  Selecione Ajuste / Grupos de observação / Grupos de transformação.


    Comando Grupos de Variância

Mais informações

Como ...	Diálogo	Veja também
Selecione este comando para definir os grupos de variância de observação usados no ajuste.

Para visualizar o diálogo Grupos de variância:

  Selecione Ajuste / Grupos de observação / Grupos de variância.


    Comando WGS-84

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para usar WGS-84 como o datum no ajuste.  O datum WGS-84 deve ser usado quando um ajuste minimamente limitado estiver sendo executado em Observações GPS.

Para selecionar o datum WGS-84:

  Selecione Ajuste / Datum / WGS-84. Uma marca de verificação aparece próximo a WGS-84.


    Comando Estratégias de Ponderação

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para exibir o diálogo Estratégias de Ponderação com opções para definir e aplicar as estratégias de ponderação escalares usadas no ajuste.

Para visualizar o diálogo Estratégias de ponderação:

  Selecione Ajuste / Estratégias de ponderação.


    Comando Salvar (Coordenadas de Calibração)

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para salvar as coordenadas de calibração após executar um ajuste GPS minimamente limitado. As coordenadas de calibração consistem das latitudes, longitudes e alturas de elipsóide WGS-84 geradas durante o ajuste minimamente limitado.

Estas coordenadas são usadas como as coordenadas GPS quando uma calibração de local estiver sendo executada com o software Trimble Geomatics Office.

Para visualizar o diálogo Salvar Coordenadas de calibração:

  Selecione Ajuste / Coordenadas de calibração / Salvar.

NOTA: Este comando não está disponível quando você estiver usando o datum do projeto para ajustar a rede, ou quando houver dados terrestres no ajuste.

NOTA: Quando coordenadas de calibração são salvadas, uma coordenada de calibração WGS-84 é salvada para o ponto.


    Comando Remover (Coordenadas de Calibração)

Mais informações

Como ...	Veja também
Perspectiva geral

Coordenadas de calibração são latitudes, longitudes, e alturas de elipsóide WGS-84 que são geradas durante um ajuste GPS minimamente limitado no datum WGS-84. Selecione este comando para removê-las do projeto:

  Selecione Ajuste / Coordenadas de calibração / Remover.


    Comando Desativar Observações

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando quando você quiser desativar totalmente uma observação que aparece na lista de observações de ajuste. Desativar totalmente uma observação remove-a da lista de Observações e ela não é mais usada em ajustes ou recomputações.

NOTA: Desativar uma observação não é o mesmo que excluir uma observação. Observações excluídas continuam a aparecer na lista de Observações, mas não são processadas em ajustes ou recomputações.

Para desativar uma observação:

1.	Selecione Ajuste / Observações. O diálogo Observações aparece.

2.	Clique com o botão da direita na observação apropriada para acessar o menu de atalho e então selecione Desativar Observação.

A observação é removida da lista de Observações é não é mais usada em ajustes ou recomputações.

Você não pode reativar uma observação desde o diálogo Observações. Invés disso, selecione a observação e reative suas propriedades desativadas desde a janela de gráficos. A observação é reativada trocando seu status de desativado para ativado.


    Comando Coordenadas de Calibração

Mais informações

Como ...	Diálogo	Veja também
Perspectiva geral

Selecione este comando para exibir um submenu com comandos para salvar e remover coordenadas de calibração.

Para acessar o submenu:

  Selecione Ajuste / Coordenadas de calibração.

Um menu aparece com estes comandos:

  Salvar

  Remove


    Diálogo Salvar coordenadas da calibração

Mais informações

Como ...	Ver também
Perspectiva geral

Use o diálogo Salvar coordenadas da calibração para selecionar o modo de salvar as coordenadas da calibração.

NOTA: Esta opção somente é disponível se o datum do ajuste é configurado para WGS-84 e somente observações GPS foram ajustadas.

Para acessá-la:

  Selecione Ajuste / Coordenadas da calibração / Salvar.

O grupo Salvar coordenadas para calibração inclui as seguintes opções:

Pontos existentes

Se optar por salvá-las sob Pontos existentes, as coordenadas são salvadas como uma coordenada adicional chamada Grupo de calibração.

Novos pontos com sufixo

Se optar por salvá-las sob Novos pontos com sufixo: GPS, um novo registro de ponto é criado com o nome do ponto "<Nome do ponto>-GPS". Pode-se mudar o sufixo ‘GPS’ antes de salvar as coordenadas da calibração.

Para maiores informações, consulte Salvando coordenadas da calibração.


    Barra de ferramentas de Controle de Elipse

Mais informações

Como ...	Veja também
Perspectiva geral

A barra de ferramentas de Controle de Elipse permite que você filtre as elipses de erro, setas de erro de altura e setas de erro de elevação aparecendo na janela de gráficos após um ajuste. Controles são também fornecidos para dimensionar o tamanho das elipses de erro e ajustar o tamanho das marcas.

Para visualizar a barra de ferramentas de Controle de Elipse:

  Desde a visualização do Levantamento, selecione Visualizar / Barras de ferramentas / Controles de Elipse.

  Desde a área de barra de ferramenta de visualização do Levantamento, clique com o botão da direita e selecione Controles de Elipse.

A barra de ferramentas de Controles de Elipse aparece. Você pode selecionar este comando novamente para esconder a barra de ferramenta.

NOTA: Você pode também usar a guia de Controles de Elipse de Erro no diálogo Visualizar opções para controlar a exibição de elipses de erro.

Estes botões de barra de ferramentas estão disponíveis:

	Este botão comuta o comando de Elipse de erro. Comutar este comando é equivalente a selecionar e desmarcar Mostrar Elipses de Erro de ponto & caixa de verificação de Setas no diálogo Visualizar Opções. Os comandos de Erro de Altura e Erro de Elevação (botões) tornam-se disponíveis quando este botão é comutado.
	Este botão comuta o comando de erro de Altura e somente está disponível quando o comando de Elipses de Erro tenha sido comutado.
	Este botão comuta o comando de erro de Elevação e somente está disponível quando o comando de Elipses de Erro tenha sido comutado.

Estes controles também estão disponíveis:

Escala de elipse de erro

A Escala de elipse de erro, mostrada abaixo, controla o tamanho das elipses de erro que aparecem na janela de gráficos após um ajuste.

Deslizando o controle para a esquerda diminui o tamanho da elipse e deslizando-o para a direita tem o efeito oposto.

Tamanho das marcas

Este controle, mostrado abaixo, ajusta a distância de marca da escala da barra da elipse de erro.

O botões de rotação controlam a distância entre as marcas exibidas na janela de Gráficos. A escala de barra torna-se mais comprida quando aumentada em tamanho e a distância entre as marcas é ajustada para combinar com o valor que aparece no Controle de tamanho das marcas. O oposto é verdadeiro quando a configuração de marca da escala de barra é diminuída.


    Comando de Controles de Elipse

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para mostrar ou esconder a barra de ferramentas de Controles da Elipse.

Para mostrar ou esconder a barra de ferramentas de Controles da Elipse:

  Selecione Visualizar / Barras de ferramentas / Controles de elipse.

A barra de ferramentas é mostrada ou escondida cada vez que este comando é executado.

NOTA: Você também pode configurar os controles de elipse de erro desde a guia Controles de elipse de erro no diálogo Opções de Visualização.


    Comando Elipse de Erro

Mais informações

Como ...	Veja também
Perspectiva geral

O comando de elipse de erro está disponível na barra de ferramentas Controles de elipse. Este comando filtra as elipses de erro e setas que aparecem na janela de gráficos após um ajuste. Os botões de comando de Erros de Altura e Erros de Elevação na barra de ferramentas tornam-se disponíveis quando este comando é selecionado.

NOTA: Os comandos de elipses de erro são equivalentes a selecionar as Elipses de Erro do Ponto & caixa de verificação de Setas desde o diálogo Opções de Visualização. Alterar o estado desta caixa de verificação também muda a configuração do botão de Elipse de Erro atual. Para mais informações, veja Filtrando Elipses de Erro e Setas.

Para selecionar o comando de elipse de erro:

1.	Visualize a barra de ferramentas Controles de elipse.

Para mais informações, veja Mostrando e Ocultando a Barra de Ferramentas de Controle de Elipse.

2.	Para filtrar as elipses de erro e setas, clique em [image].

As elipses de erro são mostradas ou escondidas, dependendo de seu estado original quando o botão foi pressionado. Os botões de Erro de Altura e Erro de Elevação tornam-se disponíveis quando o botão de elipses de erro é selecionado. Se as barras de ferramentas de seta de Erro de Altura e Erro de Elevação são selecionadas, as setas de Altura e/ou Elevação são também exibidas.


    Comando de Erros de Altura

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para filtrar as setas de erro de altura que aparecem na janela de gráficos após um ajuste.

NOTA: Você deve selecionar o comando de elipse de erro na barra de ferramentas Controles de elipse, ou na caixa de verificação Mostrar elipses e setas de erro do ponto no diálogo Opções de Visualização antes de este comando tornar-se disponível.

Para selecionar o comando Erros de Altura:

1.	Visualize a barra de ferramentas Controles de elipse.

2.	Para filtrar as elipses de erro e setas, clique em [image]. As elipses de erro são mostradas ou escondidas, dependendo de seu estado original quando o botão foi pressionado. O botão de Erro de Altura torna-se disponível quando o botão de elipses de erro é selecionado.

3.	Desde a Barra de ferramentas de controle de elipse, clique em [image].

As setas de altura são mostradas ou escondidas cada vez que você clicar no botão.


    Comando de Erros de Elevação

Mais informações

Como ...	Veja também
Perspectiva geral

Selecione este comando para filtrar as setas de erro de elevação que aparecem na janela de gráficos após um ajuste.

NOTA:  O comando de elipse de erro na barra de ferramentas Controles de elipse ou a caixa de verificação Mostrar Elipses de erro e Setas do ponto no diálogo Opções de Visualização devem ser selecionados antes que este comando torne-se disponível.

Para selecionar o comando Erros de Elevação:

1.	Visualize a Barra de ferramentas de controle de elipse.

Para mais informações, veja Mostrando e escondendo a barra de ferramentas de controle de elipse.

2.	Para filtrar as elipses de erro e Setas, clique em [image]. As elipses de erro são mostradas ou escondidas, dependendo de seu estado original quando o botão foi pressionado. O botão de Erro de Elevação torna-se disponível quando o botão de elipses de erro é selecionado.

3.	Desde a Barra de ferramentas de controle de elipse, clique em [image].

As setas de elevação são mostradas ou escondidas cada vez que você clicar no botão.


Para mostrar ou ocultar a barra de ferramentas de Controles de Elipse

 Perspectiva geral e Mais informações

Perspectiva geral

A barra de ferramentas de controles de elipse pode ser usada para controlar o tamanho e a exibição das elipses de erro e setas que aparecem na janela de gráficos.

Para visualizar a barra de ferramentas Controles de elipse, faça um dentre os seguintes:

  Desde a visualização do levantamento, Selecione Visualizar / Barras de ferramentas / Controles de elipse.

  Desde a área da barra de ferramentas visualização do levantamento, clique com botão da direita e Selecione Controles de Elipse.

A barra de ferramentas Controles de elipse aparece.


Para mudar o tamanho exibido de elipses de erro

Perspectiva geral

O tamanho das elipses de erro que aparece na janela de gráficos pode ser aumentado ou diminuído.

Para mudar o tamanho exibido das elipses de erro:

1.	Visualize a Barra de ferramentas de controle de elipse.

Para mais informações, veja Mostrando e ocultando a barra de ferramentas de controle de elipse.

2.	Desde a Escala de elipse de erro, faça um dentre os seguintes:

  Deslize a Escala de elipse de erro para a esquerda para diminuir o tamanho de Elipse.

  Deslize a Escala de elipse de erro para a direita para aumentar o tamanho de Elipse.

O tamanho das elipses de erro é ajustado.


Para ajustar as marcas de Escala da barra de Elipse de Erro

Perspectiva geral

A distância de marca de escala da barra da elipse de erro pode ser ajustada desde a Barra de ferramentas de controles de elipse.

Para ajustar a distância de marca de escala da barra da elipse de erro:

1.	Visualize a Barra de ferramentas de controle de elipse.

Para mais informações, veja Mostrando e ocultando a barra de ferramentas de controle de elipse.

2.	Desde Controle de tamanho das marcas, faça um dentre os seguintes:

  Clique no botão de rotação mais baixa para diminuir a distância de marca de escala da barra da elipse de erro.

  Clique no botão de rotação mais alta para aumentar a distância de marca de escala da barra da elipse de erro.

      A escala de barra torna-se mais comprida quando aumentada em tamanho e a distância entre as marcas é ajustada para combinar com o valor que aparece no Controle de tamanho das marcas. O oposto é verdadeiro quando a configuração de marca de escala de barra é diminuída.


Para filtrar elipses de erro e setas

Mais informações

Veja também	Como ...
Perspectiva geral

As elipses de erro e setas que aparecem na janela de gráficos após um ajuste, podem ser filtradas desde a barra de ferramentas das elipses de erro ou desde o diálogo Opções de Visualização.

NOTA: A caixa de verificação Mostrar Elipses de erro & setas do ponto no diálogo Opções de Visualização e o botão Elipse de Erro na Barra de ferramentas de controles de elipse são interligados. Comutar uma configuração afeta o outro controle. Usar a Barra de ferramentas de controles de elipse tem vantagens adicionais. Para mais informações, veja Barra de ferramentas de controles de elipse.

Para filtrar as elipses de erro e setas desde a Barra de ferramentas de controles de elipse:

1.	Visualize a Barra de ferramentas de controles de elipse.

2.	Para filtrar as elipses de erro e setas, clique em [image]. As elipses de erro são mostradas ou escondidas, dependendo de seu estado original quando o botão foi pressionado. Os botões de Erro de Altura e Erro de Elevação tornam-se disponíveis quando o botão de elipses de erro é selecionado. Se as barras de ferramentas de setas de erro de Altura e erro de elevação forem selecionadas, as setas de altura e/ou elevação são também exibidas.

3.	Desde a Barra de ferramentas de controle de elipse, faça um ou ambos dentre os seguintes:

  Para filtrar setas de altura, clique em [image].

  Para filtrar setas de elevação, clique em [image].

As setas de altura ou elevação são mostradas ou escondidas cada vez que você clicar em um desses botões.

Para filtrar as elipses de erro e setas desde o diálogo Opções de Visualização:

1.	Selecione Visualizar / Opções. O diálogo Opções de Visualização aparece.

2.	Selecione a guia controles de elipse de erro.

3.	Selecione a caixa de verificação Mostrar elipses de erro & setas do ponto.

As elipses de erro e setas são ligadas e desligadas cada vez que a caixa de verificação é selecionada.


    Janela Propriedades - página Estimativa do erro

Mais informações

 Ver também

Perspectiva geral

A página Estimativa do erro exibe os erros de ponto determinados depois do ajuste da rede. Esta página somente é disponível se o módulo Network Adjustment estiver instalado. Pode-se visualizar esta página de propriedades depois de um ajuste.

Para visualizar a página Estimativa do erro:

1.	Clique duas vezes no ponto que deseja visualizar. A janela Propriedades aparece com o ponto selecionado.

2.	Na guia Levantamento, clique o botão Estimativa do erro [image].

Aparece a página Estimativa do erro. Ela contém os seguintes campos:

Norte, Leste

Exibe os erros padrões nos componentes da coordenada horizontal.

Elevação, Altura

Exibe os erros padrões nos componentes da coordenada vertical.

Confidência

Exibe o nível de confidência dos resultados do erro propagado.