Copyright: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.
Citation: © 1997 - 2002 Trimble Navigation Limited. All rights reserved.


O software Trimble DTMLink™ do software Trimble Geomatics Office™ é um potente sistema para a criação de um modelo de superfície de contorno. Com este software você pode criar novas superfícies de contorno. Com este software você pode criar novas superfícies de contorno e editar as superfícies de contorno criadas anteriormente. Pode-se também importar superfícies de contorno geradas por outros pacotes semelhantes.

O software possui capacidade de incluir limites e linhas de interrupção no modelo de superfície de contorno e leva em conta características avançadas de edição de triângulos para dar mais controle sobre a formação do modelo.

Um Modelo Digital de Terreno quadriculado é criado do modelo de superfície do contorno para exportar para um coletor de dados ou um arquivo de dados.

O modelo criado pode ser usado pelo software RoadLink™ para cálculos de terraplanagens.

O software DTMLink lhe permite criar relatórios de volume.

Aplicações típicas para cálculos de volume são:

  cálculos de estoque

  volumes de camadas de material, tais como filões de carvão

  volumes de lacunas tais como lagos atrás de propostas barragens

O software DTMLink usa o método de computação de volumes de prismas triangulares individuais. Estes são definidos pelos planos triangulares que formam o modelo de superfície do contorno, usando as áreas de base e alturas médias de prismas.

O software DTMLink permite criar superfícies de comparação. Uma superfície de comparação é um modelo de superfície de contorno da diferença entre as duas superfícies. Pode-se usar esta superfície em conjunto com o tipos de cálculo de volumes ‘Acima da elevação’ para calcular os volumes de corte e aterro entre as duas superfícies.


Índice

São disponíveis os seguintes Tópicos de Ajuda:

1. Módulo Trimble DTMLink

2. Comandos de Menu

3. Sugestões

4. Mensagens de Erro

5. Todos tópicos

Presumimos que você esteja familiarizado com o uso básico do Microsoft Windows. Consulte a documentação do Microsoft Windows se tiver dúvidas quanto ao uso deste software.


Todos Tópicos

Na seção Todos tópicos do Índice, todos os tópicos deste sistema de ajuda são enumerados alfabeticamente.


Abrir Superfície
Arquivo / Abrir Superfície

	Clique a ferramenta Abrir Superfície na barra de ferramentas Padrão
Use este comando para abrir uma superfície.

Superfícies disponíveis em

Selecione um nome da lista de nomes que aparecem no quadro inferior do diálogo Selecionar Superfície e insira este nome no campo sob o campo Superfícies disponíveis em. Se o nome não estiver lá, clique Pasta.

NOTA: As superfícies disponíveis no campo são somente para leitura.

Pasta

Clique Pasta para abrir o diálogo Procurar Pasta. O diálogo lhe permite selecionar a pasta que contém os arquivos.

A pasta padrão é C:\Trimble Geomatics Office\Projects\xx\RoadLink – DTMLink …, onde XX é o nome do Projeto.

SUGESTÃO: Quando estiver usando o diálogo Procurar Pasta, sempre procure o arquivo da superfície no nível mais baixo do diretório.


Salvar Superfície
Arquivo / Salvar Superfície

	Use a ferramenta Salvar Superfície na barra de ferramentas Padrão

Use este comando para salvar mudanças feitas na superfície atual.


Fechar Superfície
Arquivo / Fechar Superfície

Use este comando para fechar um arquivo no software DTMLink™.


Importar
Arquivo / Importar

	Use esta ferramenta de Importar na barra de ferramentas Padrão.

Use este comando para importar os seguintes tipos de arquivos para o projeto:

  Arquivo Trimble TIN Digital Terrain Model (*.ttm)

  Arquivo Trimble Gridded Digital Terrain Model (*.dtx)

  Superfície (TIN) do arquivo do Projeto TerraModel (*.pro)

  Superfície do arquivo (TIN) AutoCAD DXF

  Superfície do arquivo LandXML (*.xml)

  Arquivo Paydirt/SiteWork Grid (*.grd)

  Arquivo Civilcad ASCII 5

  Arquivo de superfície 12D

  Arquivo de superfície InRoads

  Arquivo MX GENIO TIN

  Arquivo de superfície REB

  Marcas de grid do GEOPAK


Arquivo Trimble TIN Digital Terrain Model (*.ttm)

Use este comando para importar um arquivo Trimble TIN Digital Terrain Model para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione o arquivo Trimble TIN Digital Terrain Model (*.ttm) e clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

O campo Arquivos do tipo mostra somente o tipo Trimble TIN Digital Terrain Model (*.ttm). O tipo de arquivo não pode ser mudado a partir deste campo.

4.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se uma superfície do mesmo nome já existir no projeto, aparece o diálogo Importar superfície. Deve-se dar um novo nome à superfície que está sendo importada.


Arquivo Trimble Gridded Digital Terrain Model (*.dtx)

Use este comando para importar um arquivo do Trimble Gridded Digital Terrain Model para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	A partir da lista da guia Superfície, selecione o arquivo Trimble Gridded Digital Terrain Model (*.dtx).

 	SUGESTÃO: Clique o botão Configuração para remover os pontos que definem o grid e isso entra dentro de uma tolerância específica.

3.	Clique OK.

Aparece o diálogo Abrir.

4.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pedirá que use a pasta da qual você importou um arquivo da última vez.

O campo Arquivos do tipo mostra somente o tipo Trimble Gridded Digital Terrain Model (*.dtx). O tipo de arquivo não pode ser mudado a partir deste campo.

5.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

6.	Clique Abrir para importar a superfície. Se a superfície do mesmo nome já existir no projeto, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receberl um novo nome.


Importar Configuração DTM em Grid

Use esta opção para remover pontos que definam o grid e que encontrem-se dentro de uma determinada tolerância. Selecione Decimar Grid e, no campo Tolerância de decimação do Grid ao TIN, especifique o valor da tolerância.


Superfície (TIN) do Arquivo do Projeto TerraModel (*.pro)

Use este comando para importar uma Superfície (TIN) do arquivo do Projeto TerraModel para o DTMLink.

NOTA: Para converter com êxito para um arquivo de Superfície (TIN), o arquivo do Projeto TerraModel deve possuir uma rede de triângulos numa camada.

Para importar o arquivo:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione Superfície (TIN) do arquivo TerraModel (*.pro) e clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

4.	Escolha uma das seguintes opções:

  Insira um nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir.

Se o arquivo possuir somente uma camada, a superfície importará. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. Deve-se dar um novo nome à superfície que está sendo importada.

Se o arquivo do Projeto TerraModel possuir mais de uma camada, aparece o diálogo Escolher camada da superfície.

6.	Selecione a camada ou camadas para importar. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. Deve-se dar um novo nome à superfície que está sendo importada.


Diálogo Escolher Camada da Superfície

Use este diálogo para selecionar a camada para converter para importação.

Na lista de Camadas, selecione a camada para converter para um arquivo de superfície. Pode-se selecionar camadas múltiplas para importar, mas somente uma camada pode ser exibida de cada vez.


Superfície (TIN) de um arquivo AutoCAD DXF

Use este comando para importar uma Superfície (TIN) de um arquivo AutoCAD DXF para o DTMLink.

NOTA: Para converter com êxito para um arquivo de Superfície (TIN), o arquivo AutoCAD DXF file deve consistir de uma rede de triângulos de Faces 3D ou Polilinhas 3D.

Para importar o arquivo:

1.	Selecione Arquivo / Importar

Aparece o diálogo Importar.

2.	Se o arquivo DXF foi originalmente gerado usando unidades diferentes daquelas especificadas no projeto, clique Configuração para configurar o arquivo DXF.

Aparece o diálogo Opções de configuração de importar DXF. Use este diálogo para designar unidades ao arquivo DXF que está sendo importado ou convertido. Deve-se especificar as mesmas unidades em que o arquivo DXF foi criado originalmente.

3.	Selecione as unidades apropriadas para o arquivo DXF.

4.	Clique OK no diálogo Opções de configuração do DXF.

5.	Clique OK no diálogo Importar.

Aparece o diálogo Abrir.

6.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

O campo Arquivos do tipo mostra somente o tipo de arquivo ASCII AutoCAD DXF (*.dxf). Não pode-se mudar o tipo de arquivo neste campo.

7.	Escolha uma das seguintes opções:

  Insira o nome do arquivo.

  Clique o arquivo requerido.

8.	Clique Abrir.

Se o arquivo possuir somente uma camada, a superfície importará. Se uma superfície do mesmo nome já existir no projeto, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber novo nome.

Se o arquivo DXF possuir mais de uma camada, aparece o diálogo Escolher camada da superfície.

9.	Selecione a camada ou camadas para importar. Se uma superfície do mesmo nome já existir no projeto, aparece o diálogo Importar superfície. Deve-se dar um novo nome à superfície que está sendo importada.


Diálogo Opção de configuração de Importar DXF

Use este diálogo para especificar as unidades para importação de uma Superfície (TIN) de um arquivo AutoCAD DXF.

Unidades do arquivo DXF

Use este campo para designar unidades ao arquivo DXF que está importando. Por exemplo, se o projeto DTMLink usar Pés Internacionais por coordenadas mas um arquivo *.dxt foi gerado em metros, deve-se então especificar metros neste grupo ao importar aquele arquivo *.dxf.

Para mudar as unidades, faça uma seleção da lista suspensa:

  Metros (m)

  Pés internacionais (ft)

  Pés de levantamento US (FT)

NOTA: Quando estiver importando uma Superfície (TIN) de um arquivo AutoCAD DXF, o campo Comprimir Polilinhas não estará disponível.


Superfície do Arquivo LandXML (*.xml)

Use este comando para importar uma superfície de um arquivo LandXML para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione Superfície do arquivo LandXML (*.xml) e clique OK.

Aparece o diálogo Abrir diálogo.

3.	No campo Olhar em, escolher a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

4.	Escolha uma das seguintes opções:

  Insira um nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se no projeto já existir uma superfície com o mesmo nome, aparece o diálogo Importar superfície. Deve-se dar um novo nome à superfície importada.


Arquivo Paydirt/SiteWork Grid (*.grd)

Use este comando para importar um arquivo SiteWork Grid para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione o arquivo Paydirt/SiteWork Grid (*.grd).

SUGESTÃO: Clique o botão Configuração para remover pontos que definam o grid e que estejam dentro de uma determinada tolerância.

2.	No diálogo Importar, clique OK.

Aparece o diálogo Impartar arquivo SiteWork Grid.

3.	Clique Procurar para buscar a pasta que contém o arquivo que deseja importar.

4.	No campo Arquivo, navegue para o arquivo SiteWork Grid requerido.

5.	Clique OK para importar a superfície. Se no projeto já existir uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber outro nome.


Diálogo Importar arquivo SiteWork Grid

Use este diálogo para importar um arquivo SiteWork Grid para o software DTMLink.

Local

Este campo indica o local do arquivo SiteWork Grid.

Procurar

Clique este botão para procurar a pasta que contém o arquivo SiteWork Grid.

Arquivos

Use este campo para selecionar o arquivo SiteWork Grid.

OK

Clique este botão para importar o arquivo SiteWork Grid.

Cancelar

Clique este botão para cancelar a operação de importação e voltar ao diálogo Importar.


Arquivo Civilcad ASCII 5

Use este comando para importar um arquivo Civilcad ASCII 5 para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione o arquivo Civilcad ASCII 5 (*.AS5).

SUGESTÃO: Clique o botão Configuração para remover pontos que definem o grid e que estejam dentro de uma determinada tolerância.

3.	Clique OK.

Aparece o diálogo Abrir.

4.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta que contém o arquivo que deseja importar.

5.	Clique Abrir.

Aparece o diálogo Escolher camada de superfície.

6.	Selecione a camada que contém a informação do grid.

7.	Clique Abrir para importar a superfície. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber um novo nome.


Arquivo Superfície 12D

Use este comando para importar um arquivo de superfície 12D para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Da lista na guia Superfície, selecione o arquivo de superfície 12D e clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que você deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

4.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber um novo nome.


Superfície do Arquivo InRoads (*.tin)

Use este comando para importar uma superfície de um arquivo InRoads para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione o arquivo da superfície InRoads e clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

4.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber um novo nome.


Arquivo MX GENIO TIN

Use este comando para importar um arquivo MX GENIO TIN (*.txt) para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	da lista da guia Superfície, selecione o arquivo MX GENIO TIN e clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

4.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber um novo nome.


GEOPAK Grid Spots

Use este comando para importar um Gridded Digital Terrain Model (*.dtx) de um arquivo  GEOPAK para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione GEOPAK Grid Spots.

SUGESTÃO: Clique o botão Configuração para remover pontos que definam o grid e estejam dentro de uma determinada tolerância.

3.	Clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

O campo Arquivos do tipo mostra somente o tipo Todos arquivos (*.*). Não pode-se mudar o tipo de arquivo deste campo porque um arquivo GEOPAK pode contar com qualquer extensão.

4.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber um novo nome.


Arquivo de Superfície RED

Use este comando para importar um arquivo de superfície REB (*.reb) para o DTMLink:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Na lista da guia Superfície, selecione o arquivo se superfície REB e clique OK.

Aparece o diálogo Abrir.

3.	No campo Olhar em, escolha a pasta que contém o arquivo que deseja importar. O DTMLink lhe pede que use a pasta da qual você importou um arquivo da última vez.

4.	Escolha uma das seguintes opções:

  Insira o nome de arquivo.

  Clique o arquivo requerido.

5.	Clique Abrir para importar a superfície. Se já existir no projeto uma superfície com o mesmo nome, aparece o diálogo Importar superfície. A superfície que está sendo importada deve receber um novo nome.


Importar Superfície

Usar o diálogo Importar Superfície para nomear a nova superfície. Este diálogo somente aparece se uma superfície do mesmo nome já existir no projeto.

Novo nome de superfície

O nome do arquivo é o nome padrão para a superfície. Use este campo para dar à superfície um nome único.


Exportar
Arquivo / Exportar

	Use a ferramenta Exportar da barra de ferramentas Padrão

Use este comando para exportar (ou enviar) um arquivo para um Survey Controller ou dispositivo TDS ou para criar um arquivo.

NOTA: Formatos de exportação que liberam arquivos ASCII, sempre liberam dados numéricos em forma padronizada, isto é, sem separadores de milhares ou pontos para casa decimal.

O diálogo Exportar enumera formatos de exportação disponíveis. As etiquetas do diálogo mostram os tipos de formatos de exportação.

Etiqueta Sistema

Use esta etiqueta para fazer uma seleção da lista de formatos disponíveis.

Use este formato de exportação …	para criar …
TIN DTM para o Trimble Survey Controller	um arquivo DTM compatível, triangulado dos pontos selecionados para exportação diretamente ao Trimble Survey Controller.
TIN DTM para o Trimble Survey Controller (*.ttm)	um arquivo DTM triangulado dos pontos selecionados.
Gridded DTM para o Trimble Survey Controller	um arquivo DTM compatível, de grid, dos pontos selecionados para exportação diretamente para o Trimble Survey Controller.
Gridded DTM para o Trimble Survey Controller file (*.dtx)	um arquivo DTM de grid dos pontos selecionados. As saídas de valores DTM de grid para um arquivo ASCII sempre estão no formato métrico.
TIN DTM para o Trimble 5600 TDS	um arquivo DTM compatível, triangulado, dos pontos selecionados para a exportação direta para um instrumento Trimble 5600 TDS.
TIN DTM para o arquivo Trimble 5600 TDS (*.dtm)	um arquivo DTM triangulado dos pontos selecionados como um arquivo Trimble 5600 TDS (*.dtm) que pode ser lido por um instrumento Trimble 5600 TDS que execute o TDS Survey Pro CE.
TIN DTM para o TDS Survey Pro CE	um arquivo DTM compatível, triangulado, dos pontos selecionados para exportação direta a um coletor de dados TDS Survey Pro CE.
TIN DTM para arquivo TDS Survey Pro CE (*.dtm)	um arquivo DTM triangulado de pontos selecionados que podem ser lidos por um coletor de dados TDS Survey Pro CE.
Arquivo AutoCAD DXF de faces 3D	um arquivo ASCII DXF de faces 3D que pode ser lido em software de outras marcas. Uma entidade de face 3D é gravada para cada triângulo do modelo de contorno.
Contorno para arquivo AutoCAD DXF	um arquivo ASCII DXF do contorno que pode ser lido em software de outras marcas. Clique Configurar para especificar as opções de saída.
Ver também


DTM Quadriculado para o Trimble Survey Controller

Use estes tipos para criar um grupo regular de dados quadriculados com as elevações dos pontos interpolados do modelo de contorno.

NOTA: O Modelo Digital de Terreno (DTM) quadriculado permite que um quadriculado regular de pontos Norte-Sul/Leste-Oeste seja interpolada a partir do modelo atual de contorno.

Use o comando Arquivo / Exportar para criar um DTM quadriculado para exportar para a versão 6.5 do software do Survey Controller da Trimble ou mais recente.

Selecione o DTM Quadriculado para o Trimble Survey Controller ou DTM Quadriculado para as opções de exportação de arquivos do Trimble Survey Controller.

Clique OK, e aparece um quadriculado retangular na janela de gráficos. Esse quadriculado retangular mostra os mais pequeno retângulo que liga completamente a superfície. Arrastando os limites retangulares do quadriculado, lhe permite definir a área desejada.

SUGESTÃO: Use os campos Esquerdo, Cima, Direito, Baixo no quadro do grupo do diálogo Retângulo Quadriculado para um ajuste fino do tamanho do retângulo.

Os campos do diálogo Retângulo Quadriculado são:

Esquerda

Use preencher campo ou entre valores para o leste do lado esquerdo do quadro medido em metros, pés internacionais ou pés US Survey. Este campo mostra a extensão do arraste na borda esquerda do retângulo na janela de gráficos.

Cima

Use preencher campo ou entre valores para o norte do lado de cima do quadro medido em metros, pés internacionais ou pés US Survey. Este campo mostra a extensão do arraste na borda de cima do retângulo na janela de gráficos

Direita

Use preencher campo ou entre valores para o leste do lado direito do quadro medido em metros, pés internacionais ou pés US Survey. Este campo mostra a extensão do arraste na borda direita do retângulo na janela de gráficos.

Baixo

Use preencher campo ou entre valores para o norte do lado de baixo do quadro medido em metros, pés internacionais ou pés US Survey. Este campo mostra a extensão do arraste na borda de baixo do retângulo na janela de gráficos.

Tamanho do Quadriculado

Use os campos da etiqueta Tamanho do Quadriculado para especificar o número de colunas e filas que formam o quadriculado.

Colunas	Insira o número de colunas para o Retângulo do Quadriculado.
Filas	Insira o número de filas para o Retângulo do Quadriculado.
Ambos campos possuem um padrão de 10. Isto significa que pode-se criar um quadriculado numa base retangular.

NOTA: Ao mudar o número de Colunas, Filas ou ambos na etiqueta Tamanhos do Quadriculado, os campos Altura e Largura da etiqueta Tamanho do Passo são recalculados automaticamente pelo software DTMLink. Os campos atualizados mostram a nova largura e altura para cada tamanho de Passo.

Tamanho de Passo

Use os campos da etiqueta Tamanho de Passo para especificar a largura e altura de cada coluna e fila que formam um quadriculado.

Largura	Insira o valor para a largura de uma coluna.
Altura	Insira o valor para a altura de uma fila.
NOTA: Toda mudança nos valores da Largura, Altura ou de ambos, na etiqueta Tamanho do Passo, resulta na re-cálculo dos campos Tamanho do Quadriculado.

OK

Clique OK para exportar o DTM quadriculado. O arquivo fornece uma lista das coordenadas e elevações interpoladas em cada ponto do quadriculado. Se você selecionar o DTM quadriculado como opção de exportação do Trimble Survey Controller, pode-se especificar o dispositivo para salvar o arquivo.

NOTA: Pontos do Quadriculado dentro do retângulo do limite, mas fora da superfície do contorno, não possuem uma elevação interpolada e são descritas como uma linha em branco no arquivo.


DTM Triangulado para o Trimble Survey Controller

Use este tipo para criar dados triangulados baseados nos pontos que definem os triângulos do modelo de contorno:

Para criar um DTM triangulado para exportar para o software versão 7.5 do Survey Controller™ da Trimble ou mais recente:

1.	Selecione Arquivo / Exportar.

2.	No diálogo Exportar, selecione uma das seguintes opções:

  TIN DTM para o Trimble Survey Controller

  TIN DTM para o arquivo Trimble Survey Controller

3.	Clique OK.

Na janela de gráficos, um grid mostra o menor retângulo que completamente enquadra a superfície. Arraste os limites do grid para definir a área desejada.

SUGESTÃO: Use os campos Esquerdo, Cima, Direito, e Inferior na caixa de grupo do diálogo Extensões TIN para fazer um ajuste fino do tamanho do retângulo.

Esquerda

Use preenchimento de campo ou introduza valores para a esquerda (oeste) da caixa medidos em metros, pés Internacional, ou pés de levantamento americano. Este campo mostra a extensão ao arrastar a margem esquerda do retângulo na janela dos gráficos.

Cima

Use preenchimento de campo ou introduza valores para cima (norte) da caixa medidos em metros, pés Internacional, ou pés de levantamento americano. Este campo mostra a extensão ao arrastar a margem de cima do retângulo na janela dos gráficos.

Direita

Use preenchimento de campo ou introduza valores para a direita (leste) da caixa medidos em metros, pés Internacional, ou pés de levantamento americano. Este campo mostra a extensão ao arrastar a margem direita do retângulo na janela dos gráficos.

Baixo

Use preenchimento de campo ou introduza valores para baixo (sul) da caixa medidos em metros, pés Internacional, ou pés de levantamento americano. Este campo mostra a extensão ao arrastar a margem de baixo do retângulo na janela dos gráficos.

OK

Clicar OK para exportar o DTM triangulado. O arquivo fornece uma lista de coordenadas e elevações para cada triângulo. Se for selecionado o TIN DTM para a opção de exportação do Trimble Survey Controller, pode-se selecionar o dispositivo para se salvar o arquivo.


DTM Triangulado para o Trimble 5600 TDS

Use este tipo para criar dados triangulados baseados em pontos que definam os triângulos do modelo do contorno.

Para criar um DTM triangulado para exportação para um Trimble 5600 TDS:

1.	Selecione Arquivo / Exportar.

2.	No diálogo Exportar, selecione uma das seguintes opções:

  TIN DTM para Trimble 5600 TDS

  TIN DTM para arquivo Trimble 5600 TDS

3.	Clique o botão Configurar para especificar as unidades do arquivo exportado. Use esta opção para exportar o TIN DTM em unidades que não sejam do projeto DTMLink.

4.	Clique OK para exportar o DTM triangulado.


DTM Triangulado para o TDS Survey Pro CE

Use este tipo para criar dados triangulados baseados em pontos que definam os triângulos do modelo de contorno.

Para criar um DTM triangulado para exportação ao TDS Survey Pro CE:

1.	Selecione Arquivo / Exportar.

2.	No diálogo Exportar, selecione uma das seguintes opções:

  TIN DTM para o TDS Survey Pro CE

  TIN DTM para o arquivo TDS Survey Pro CE

3.	Clique o botão Configurar para especificar as unidades do arquivo exportado. Use esta opção quando desejar exportar o TIN DTM em unidades que não sejam aquelas do projeto DTMLink.

4.	Clique OK para exportar o DTM triangulado.


Opções de Exportação de TDS TIN DTM

Use esta opção para exportar o TIN DTM em unidades que não sejam do projeto DTMLink. Selecione a unidade apropriada da lista de unidades do Arquivo.


Renomear
Arquivo / Renomear Superfície

Use este comando para renomear o arquivo atual de superfície.

O diálogo Renomear Superfície aparece. Introduza o novo nome para a superfície atual no campo.

Clicar OK para renomear a superfície atual.


Copiar Superfície
Arquivo / Copiar Superfície

Use este comando para copiar o arquivo atual de superfície.

O diálogo Copiar Superfície aparece.

Introduza o nome único para a nova superfície.

OK

Clicar OK para copiar a superfície.


Apagar Superfície
Arquivo / Apagar Superfície

Use este comando para apagar uma superfície.

Pasta

Clicar Pasta para abrir o diálogo Procurar Pasta. O diálogo permite navegar para o arquivo de superfície que deve ser aberto.

Superfícies são armazenadas no C:\Trimble Geomatics Office\Projects\xx\RoadLink - DTMLink …,, onde XX é o nome do Projeto.

SUGESTÃO: Pode-se recuperar arquivos da lixeira do Windows.


Saída
Arquivo / Saída

Use este comando para fechar a superfície atual e sair do software DTMLink.


Menu de Arquivos

Use o menu de arquivos para administrar as superfícies. Ele possui os seguintes comandos:

Abrir Superfície

Salvar Superfície

Fechar Superfície

Importar

Exportar

Renomear Superfície

Copiar Superfície

Apagar Superfície

Sair


Arquivo de faces 3D do AutoCAD DXF

O DTMLink cria um arquivo ASCII DXF com faces 3D. As coordenadas e elevação de cada vértice de triângulo são escritos no arquivo em formato DXF.

Para exportar um arquivo com faces 3D DXF:

1.	Use o comando Arquivo / Exportar.

2.	Selecione a opção Exportar arquivos de faces 3D para DXF.

3.	Clique OK.

O diálogo Exportar faces 3D para o arquivo DXF aparece.

4.	Introduza um nome de arquivo no campo nome de Arquivo.

5.	Clicar Salvar.

Por padrão, o arquivo é armazenado no C:\Trimble Geomatics Office\Projects\xx\RoadLink – DTMLink …, onde XX é o nome do Projeto.


Contornos para Arquivo AutoCAD DXF

Use esta opção para criar um arquivo ASCII DXF de contornos.

Para exportar um arquivo DXF de contorno:

1.	Selecionar Arquivo / Exportar.

O diálogo Exportar aparece.

2.	Selecionar este formato de exportação para criar um arquivo ASCII DXF dos contornos. Este arquivo pode ser lido e os contornos apresentados no software Geomatics Office™ da Trimble e software de terceiros aplicável.

3.	Clicar Configurar para especificar as opções de saída.

O diálogo Opções de Contorno DXF aparece.

4.	Selecione um dos seguintes:

  A opção linhas Retas para exportar os contornos como linhas retas

  A opção segmentos de Linha para exportar os contornos como segmentos de linha aproximando curvas

5.	Especificar o comprimento máximo do segmento de linha.

6.	Clicar OK para confirmar a opção de saída.

O diálogo Exportar aparece.

7.	Clicar OK.

O diálogo Exportar Contornos para Arquivo DXF aparece.

8.	Introduzir um nome de arquivo.

9.	Clicar Salvar para exportar o arquivo.

Por padrão, o arquivo é armazenado no C:\Trimble Geomatics Office\Projects\xx\RoadLink – DTMLink …, onde XX é o nome do Projeto.


Opções de Contorno DXF

Use este diálogo para especificar as opções de saída do contorno DXF.

Pode-se selecionar para exportar as linhas de contorno como linhas retas ou segmentos de linha para curvas aproximadas.

Se você optar por segmentos de linha aproximando curvas, pode especificar o comprimento do segmento de linha. Quanto menor o segmento de linha, melhor será a aproximação da curva mas o arquivo DXF terá mais pontos.


Diálogo Abrir

Este é o diálogo Abrir padrão:

1. Procure a pasta requerida.

2. Selecione tipo de arquivo.

3. Selecione o arquivo.


Desfazer
Editar / Desfazer

	Clique a ferramenta Desfazer na barra de ferramenta Padrão

Use este comando ou ferramenta para desfazer a última modificação feita na superfície. O texto do comando de menu mostra o que é esta modificação.


Menu Editar

Use o menu Editar para desfazer a última modificação feita à superfície.

Ele possui o seguinte comando:

Desfazer


Tópicos de Ajuda
Ajuda / Tópicos de Ajuda

Dentro do software DTMLink os comandos estão agrupados em menus.

Os comandos de menu são:

Arquivo

Editar

Visualizar

Desenhar

Ferramentas

Janela

Ajuda


Sobre
Ajuda / Sobre

O comando Sobre do menu Ajuda apresenta informações sobre programas e direitos autorais sobre o software DTMLink.

NOTA: Não é permitido copiar este programa, exceto para fins de reserva e arquivo.

Você necessitará destas informações se você encontrar falhas que necessitem suporte técnico.


Sugestão do Dia
Ajuda / Sugestão do Dia

O sistema Sugestão do Dia fornece pequenas e úteis sugestões que lhe auxiliam na operação do sistema. Com a seleção desta opção pode-se visualizar a próxima sugestão do dia. Um quadro de verificação sobre o diálogo Sugestão do Dia lhe permite escolher se deseja ou não que uma sugestão apareça cada vez que o sistema seja ligado.


Menu Ajuda

O menu Ajuda fornece informações sobre o software DTMLink. Possui os seguintes comandos:

Tópicos de Ajuda

Sugestão do Dia

Sobre


Usando as Barras de Ferramentas

As barras de ferramenta fornecem um acesso rápido, de um só passo, a  comandos de menu usados com freqüência. Um curta descrição de cada botão da barra de ferramentas aparece na barra de estado, quando você mantém o mouse sobre o botão.

Por exemplo, “Inclui um ponto no modelo da superfície” aparece no quadro da mensagem da barra de estado quando move-se o botão da barra de ferramentas Incluir Ponto, na barra de ferramentas Superfície.

Você pode ocultar, mover ou mudar de tamanho qualquer das barras de ferramentas e organizá-las de acordo com as suas preferências de trabalho.

As barras de ferramentas saltam para um ou outro lado da janela, para cima do local de trabalho, sob a barra de estado. Alternativamente, pode-se mover uma barra de ferramenta para qualquer parte da tela e orientá-la vertical ou horizontalmente.

Para voltar aos ajustes padrões, aperte o botão Reset no Visualizar / Barra de Ferramentas. (Cada barra de ferramentas volta aos seus ajustes padrões se você clicar duas vezes na barra do título da barra de ferramentas.)

Dicas de ferramentas

Quando você coloca o cursor sobre um botão de ferramenta, salta uma pequena janela chamada Descrição de ferramenta, para informar-lhe o que a ferramenta faz. A curta descrição aparece perto do cursor, sob a ferramenta.

NOTA: Voltando à barra de ferramentas esconde a barra do título.

As três barras de ferramentas são:

Barra de ferramenta padrão

Barra de ferramenta visualizar

Barra de ferramenta superfície


Barra de Ferramentas Padrão

A barra de ferramentas Padrão permite um rápido acesso a alguns dos itens do menu principal.

As seguintes opções são disponíveis na barra de ferramenta Padrão:

Botão	Comando do menu	Descrição
	Arquivo / Abrir Superfície	Abre uma superfície existente
	Arquivo / Salvar Superfície	Salva as mudanças feitas na superfície atual
	Arquivo / Importar	Permite importar uma superfície de um pacote de software de outras marcas
	Arquivo / Exportar	Permite exportar dados a um Survey Controller, dispositivo TDS ou arquivo
	Editar / Desfazer	Desfaz a última ação. O item do menu indica a operação que pode ser desfeita.
	Visualizar / Propriedades	Mostra o Browser de Propriedade. Esta janela mostra informações sobre os pontos da superfície, linhas de interrupção e limites.


Barra de Ferramentas Visualizar

A barra de ferramentas Visualizar fornece ferramentas de navegações para auxiliar a visualização na janela principal de gráficos.

As seguintes opções são disponíveis na barra de ferramentas Visualizar:

Botão	Comando do menu	Descrição
	Menu atalho	A ferramenta selecionada lhe permite selecionar um ponto na superfície, linha de interrupção ou linha de limite, e também visualizar a entidade selecionada na janela de Propriedade.
	Visualizar / Pan	Muda o centro da área do zoom
	Visualizar / Ampliar	Magnifica a apresentação, aumentando a escala.
	Visualizar / Diminuir	Reduz a apresentação, diminuindo a escala.
	Visualizar / Zoom Extensões	Muda a escala de maneira que a janela apresenta todas as entidades do projeto atual.
	Visualizar / Zoom Prévio	Mostra uma tela anterior.
	Visualizar / Camadas	Mostra ou oculta diferentes camadas.
	Visualizar / Janela Flutuante	Abre a janela flutuante que apresenta uma visualização em pequena escala das entidades da visualização atualmente selecionada. O tamanho dessa janela pode ser modificado e ela pode ser movida.


Barra de Ferramenta Superfície

A barra de ferramentas Superfície fornece ferramentas para ajudá-lo a usar o software DTMLink de maneira mais eficiente.

As seguintes opções são disponíveis na barra de ferramentas Superfície, para ajudar editar uma superfície:

Botão	Comando do menu	Descrição
	Projeto / Incluir Ponto	Inclui um ponto no modelo da superfície
	Projeto / Excluir Ponto	Exclui um ponto do modelo da superfície
	Projeto / Adicionar Linha	Remove porções da superfície que estão fora de um limite. Com essa ferramenta pode-se também definir um limite com uma linha de interrupção.
	Projeto / Adicionar Linha	Remove uma área da superfície que está dentro do limite. Com essa ferramenta pode-se também definir um limite com uma linha de interrupção.
	Projeto / Adicionar Linha	Adiciona uma linha de interrupção entre dois pontos
	Projeto / Apagar Linha	Apaga uma linha de interrupção ou um limite Aperte a seta no lado direito do botão para selecionar o tipo de linha a ser apagada. As opções do menu de cascata são: Todos Linhas de interrupção Inclui limites Exclui limites Inclui limites e linhas de interrupção Exclui limites e linhas de interrupção
	Projeto / Permutar Triângulos	Permuta dois triângulos adjacentes que formam um quadrilátero convexo
	Projeto / Apagar Tirângulo	Exclui um triângulo do modelo de superfície

A ferramenta permanece ativa até que outra ferramenta seja selecionada.


Menus Atalhos

Use o botão direito do mouse enquanto estiver na janela de gráficos, para visualizar um menu de atalho. Este é um menu sensitivo ao contexto, com diferentes opções disponíveis, dependendo do contexto sobre o qual foi clicado o botão direito do mouse.

As opções de contexto principal disponíveis são:

Janela Principal de Gráficos

O menu de atalho na janela principal de gráficos é:


Teclas para Atalho

Para escolher qualquer comando do menu que podem ser acessados da barra do menu, use o mouse ou o teclado.

SUGESTÃO: Para a maioria dos atalhos, aperte Alt e a primeira letra do nome do menu e em seguida a primeira letra do comando. Também pode-se usar atalhos familiares do Microsoft Windows para os comandos mais comuns, ou seja, Abrir, Guardar, Sair e Desfazer.

MENU	ATALHO DO TECLADO
Arquivo
Abrir	Ctrl + O
Salvar	Ctrl + S
Sair	Alt + X
Editar
Desfazer	Ctrl + Z
Visualizar
Zoom Extensões	Ctrl + E
Refrescar	F5
Janela de Propriedade	Alt + Enter
Desenho
Atualizar superfície	F4
Menu de Atalho
Modo de Seleção	F2


Visualizando Relatórios

O software DTMLink gera relatórios (tais como relatórios de volume, e cruzamento de linhas de interrupção).

Relatórios são armazenados no C:\Trimble Geomatics Office\Projects\xx\Reports\DTMLink\yy onde XX é o nome do Projeto.

Pode-se visualizar o relatório mais tarde abrindo-o no Microsoft Windows Explorer a partir desta pasta.


Preencher o campo

Use preencher o campo de qualquer janela de gráfico (inclusa a janela flutuante) para inserir valores nos campos em diálogos. Por exemplo, para inserir valores no diálogo Excluir Ponto, clique um ponto da superfície.

Nos campos que suportam preencher campo, o apontador na janela de gráficos mostra:

NOTA: Se a entidade que você selecionou na janela de gráficos não pode fornecer o valor desejado pelo campo realçado, o campo do diálogo não é afetado.

Aperte e mantenha para visualizar, localizar e verificar valores antes de copiar. Os campos apresentam os valores e a barra de estado mostra uma sumário de entidade na medida que o mouse é arrastado. Os valores somente são copiados quando o mouse é solto.

Alguns campos são preenchidos como um grupo de valores. Um só clique tenta preencher todos os campos agrupados. Por exemplo, os campos Norte e Leste geralmente formam um grupo. Para preencher somente um campo, selecione-o e, enquanto estiver apertando Alt, clique nele.

A atividade do cursor move para o próximo campo depois do preenchimento de campo.

SUGESTÕES:

Mantendo apertado o Ctrl enquanto estiver usando preencher campo, previne a passagem para entidades e somente coordenadas são escolhidas. Isso lhe permite escolher coordenadas perto de uma entidade.

Pode-se usar os comandos de menu Visualizar (por exemplo, Zoom e Pan) para encontrar entidades com os valores requeridos para o preenchimento de campo. Uma vez que estejam localizados, deve-se voltar o foco ao campo antes de copiar o valor.


Barra de Título

A barra do título estende-se ao longo do alto da tela, sobre a barra do menu.


Barra de Menu

A barra do menu está sob a barra do título. Ela contém os seguintes menus:

Arquivo

Editar

Visualizar

Projeto

Ferramentas

Janela

Ajuda

Escolhendo um comando

Para escolher um comando de um menu, clique-o com o mouse.

Atalho do teclado

Pode-se usar um mouse para escolher um menu de comando que pode ser acessado da barra de menu. No entanto, também pode-se usar o teclado.

Se preferir usar o teclado, aperte Alt e a letra sublinhada que corresponde ao menu desejado. Então aperte a letra sublinhada que corresponde ao comando desejado ou use as setas para cima e para baixo e aperte Enter para fazer nova seleção.

SUGESTÃO: Você também pode usar atalhos familiares do Microsoft Windows para os comandos mais comuns, como Abrir e Salvar.

 Ver também


Barra de Status

A barra status apresenta uma variedade de mensagens e fornece, informações imediatas e concisas sobre o atual estado do módulo DTMLink.

A barra de status aparece na parte inferior da janela principal de gráficos do software DTMLink. Ver Desenho 1.

Desenho 1  Barra de Estado

Quadro da mensagem

O quadro de mensagens da barra de status mostra informações sobre a operação do software DTMLink.

Este quadro descreve ações de itens do menu na medida que são realçados. Por exemplo, aparece a mensagem “Abre uma superfície” quando o comando Arquivo / Abrir Superfície estiver realçado. O quadro também mostra mensagens que descrevem as ações de botões da barra de ferramenta quando estão realçados. Por exemplo, aparece a mensagem “Muda o centro da área do zoom” quando se coloca o cursor sobre a ferramenta Pan na barra de ferramentas Visualizar.

Quadro das coordenadas

Quando o mouse está dentro da janela gráficos, aparecem as coordenadas correspondentes.

Quadro de extensões

Este quadro mostra a largura e altura da janela de gráficos sobre a qual o mouse está colocado.

Quadro dos indicadores

O quadro de indicadores é realçado quando uma mudança foi feita na superfície e requer-se uma atualização. Uma vez que sejam adicionados limites e linhas de interrupção, aparece o indicador Atualizar superfície neste quadro (como mostra o desenho acima) e deve-se atualizar a superfície.

Ângulo da janela

O ângulo da janela lhe permite modificar o tamanho da janela principal de gráficos.


Sugestões

Os seguintes tópicos são disponíveis:

Usando Barras de Ferramentas

Menus de Atalho

Teclas de Atalho

Visualizando Relatórios

Preencher  o campo

Barra de Título

Barra de Menu

Barra de Estado

Barra de Ferramentas Padrão

Barra de Ferramentas Visualizar

Barra de Ferramentas Superfície


Relatório do Volume
Ferramentas / Relatório do Volume

Use este comando para criar um relatório do volume sobre a superfície atual.

Tipo de relatório

No quadro Tipo de relatório, escolha o tipo de relatório de volume sobre a superfície atual.

Os tipos de cálculo de volume disponíveis são:

Acima de uma elevação

Use a opção Acima de uma elevação para as computações de estocagem.

NOTA: Considera-se que a estocagem está sobre uma base nivelada.

Entre duas elevações

Use a opção Entre duas elevações para a computação de volumes de materiais em camadas horizontais.

Volume vazio

Use a opção Volume vazio para a computação do volume de "ar" entre duas elevações especificados. Em outras palavras, o volume vazio é o volume entre duas elevações de contorno, que não está incluído sob o modelo da superfície do contorno.

Nível Superior

O nível superior define a elevação mais alto no qual o volume deve ser computado. O valor padrão mostrado neste campo é o ponto mais alto na superfície do contorno. Este campo é disponível se o nível superior for requerido para o cálculo de volume.

SUGESTÃO: Clique Mais alto para conseguir ajuda na seleção do valor máximo da elevação do modelo de superfície do contorno.

Nível Base

O nível base define o nível mais baixo no qual o volume deve ser computado. O valor padrão neste campo é o ponto mais baixo na superfície do contorno.

SUGESTÃO: Clique Mais baixo para conseguir ajuda na seleção do valor mínimo da elevação do modelo de superfície do contorno.

Encolhimento/Volume

A opção Encolhimento/Volume determina se os volumes relatados são corretos seja para a compactação de materiais (encolhimento) ou expansão de materiais (volume). O opção intermite entre Encolhimento e Volume.

NOTA: Para os volumes "naturais" (volume sem encolhimento ou volume), insira zero como valor no campo Porcentagem.

Porcentagem

No campo Porcentagem, insira o fator real de encolhimento ou aumento (expresso como uma porcentagem).

Por exemplo, se a opção Encolhimento for escolhida e o campo Porcentagem tiver um valor de dez por cento (10%), o software DTMLink emite o volume como sendo dez por cento menor que o volume natural.

Isto é, se o volume natural for de 600 metros cúbicos e a opção encolhimento for escolhida, com um fator de encolhimento de dez por cento, o software DTMLink emite o volume como sendo 540 metros cúbicos.


Acima de uma Elevação

A opção Acima de uma elevação computa o volume acima de uma determinada elevação para o ponto mais alto da superfície do contorno. São computados os volumes de prismas triangulares individuais definidos pelos planos traingulares que formam o modelo digital de terreno (DTM).

O método computa

  Volume sobre um plano (nível de base especificado)

  Área do plano

  Área da superfície.

O Desenho 1 mostra o Método de Computação do Volume do Prismóide.

Desenho 1 Método de Computação de Volume Prismóide

O volume do prisma (Vp) é calculado com a equação de volume do Prisma:

onde:

H1 é a elevação do primeiro ponto

H2 é a elevação do segundo ponto

H3 é a elevação do terceiro ponto

BL é a elevação do nível base

P é a área Plana.

A área plana é a área do triângulo da superfície projetado em um plano.

A área plana (P) é calculada com a equação da área Plana:

onde:

é o comprimento do triângulo base, calculado das coordenadas do quadrilculado

é a altura do triângulo base, calculado das coordenadas do quadriculado

O volume de cada prisma triangular é computado individualmente e somado para dar o volume total dentro da área de limite do modelo. Quando um nível de base especificado corta atravessando um triângulo, computa-se o volume do prisma da porção do triângulo que está acima do nível da base.

 Ver também


Exemplo de Cálculo de Volume Acima de uma Elevação

Uma aplicação comum para o método de cálculo do volume Acima de uma elevação serve para controlar o preenchimento regular de fossos para entulhos e outras áreas semelhantes. Os passos essenciais são:

Passo 1. Defina um limite comum para a área de interesse. Veja o Desenho 1.

Desenho 1  Aplicação para Preenchimento de Local – Área Geral

Passo 2. Recorte o modelo de contorno original que cobre todo o local, usando Incluir limite. Os dados de contorno devem estender-se pelo menos até o limite incluído definido. Ver Desenho 2.

Desenho 2  Porção do Modelo Original de Superfície

Passo 3. Compute o volume entre o nível de base definido e a superfície original contornada. Ver Desenho 3.

Desenho 3  Volume Abaixo da Superfície Original

Passo 4. Forma a segunda superfície de contorno que usa os pontos que definem a área preenchida. Recorte este novo modelo de contorno usando a definição original Incluir limite. Novamente, os dados do contorno devem estender-se para ao menos este limite. Ver Desenho 4.

Desenho 4  Novo Modelo de Contorno

Passo 5. Compute o volume entre o mesmo nível da base como usado para a primeira superfície e a nova superfície. Ver Desenho 5.

Desenho 5  Volume Abaixo da Nova Superfície

Passo 6. Compute o volume abaixo da superfície original (ver desenho 6) do volume abaixo da superfície nova.

Desenho 6  O Volume Computado

 Ver também


Entre Duas Elevações

A opção Enre duas elevações lhe permite computar o volume entre os níveis superior e inferior. Usa-se o  mesmo método de computação de volume baseado na computação dos volumes de prismas triangulares.

A opção Entre duas elevações é usada para a computação do volume do modelo de contorno selecionado entre duas elevações de contorno especificadas.

Desenho 1 Mostra o volume entre dois níveis que devem ser calculados.

Desenho 1  Volume Entre Dois Níveis

Nível Superior

O Desenho 1 mostra o volume acima do nível superior. Este é o nível sobre o qual o volume não é requerido. O valor padrão neste campo é o ponto mais alto da superfície do contorno.

Insira o nível sob o qual o volume deve ser computado no campo Nível Superior.

Nível Base

O diagrama acima mostra o volume sobre a elevação inferior. O nível Base define o nível abaixo do qual o volume não é requerido. O valor padrão neste campo é o ponto mais baixo na superfície do contorno.

Insira o nível acima do qual o volume deve ser computado no campo Nível Base.


Volume Vazio

Esta opção é usada para a computação do volume de "ar" entre dois níveis específicos. Em outras palavras, o volume  vazio é o volume entre dois níveis especificados do contorno que não está incluído sob a superfície do modelo do contorno.

Para usar a opção do Volume Vazio, especifique um nível base que esteja sob o modelo, e um nível superior que defina a superfície horizontal até a qual quer-se preencher.

Desenho 8  Computação do Volume Vazio

O volume sobre o nível base é o volume total sobre aquele nível (incluindo o volume acima do nível superior).

O volume vazio é computado com o uso desta fórmula:

onde:

BA é a área plana sobre o nível base

UL é o níver superior

BL é o nível base

BV é o volume acima do nível base

UV é o volume acima do nível superior

Nível Superior

O Desenho 8 mostra que o nível superior define o topo do volume vazio. O volume padrão mostrado neste campo é o ponto mais alto na superfície do contorno.

Nível Base

O Desenho 8 mostra que o nível base está sob a base do volume vazio. O volume padrão mostrado neste campo é o ponto mais baixo na superfície do contorno.

 Ver também


Exemplo de Volume Vazio

O método do volume vazio poderia ser usado tipicamente na computação do volume de água atrás de uma barragem proposta.

Os passos para a computação do volume de água são:

Passo 1. Forme um modelo de contorno usando os dados que definam a superfície do solo atrás da barragem proposta. Ao formar o modelo de contorno, defina um Incluir limite, que limita o modelo do contorno para a área dentro da qual a água atrás da barragem será contida. O Incluir limite deve ser definido ao longo da face da barragem proposta. Isto garante que o volume computado está atrás da barragem.

Passo 2. Compute o Volume vazio, sepecificando o nível de água desejado como Nível superior.

O seguinte diagrama mostra um exemplo da área sobre a qual uma computação de volume vazio será feita, ao longo com um exemplo de seção transversal através do topo da barragem mostrando o volume vazio computado.

Os resultados da computação do volume vazio fornece o volume de água entre o nível base especificado (que deve ser selecionado de modo que é mais baixo que o ponto mais profundo atrás da barreira), e o nível superior (nível da água). Este volume vazio é, em efeito, o volume que será preenchido pela água que estará acima da superfície mas abaixo do nível de água especificado e é, portanto, o volume requerido.

 Ver também


Reconstruir Superfície
Ferramentas / Reconstruir Superfície

Use este comando para recostruir a superfície a partir dos pontos originais da superfície. Todo ponto de superfície or triângulo apagado do modelo da superfície do contorno será reinstalado. Este comando usa os limites e linhas de interrupção que foram criados depois da importação dos pontos originais da superfície.

ATENÇÃO: Triângulos trocados ou apagados não serão retidos depois da reconstrução da superfície.


Comparar Superfícies
Ferramentas / Comparar Superfícies

A opção Comparar Superfícies permite gerar uma comparação de superfície a superfície de duas superfícies selecionadas. A superfície resultante ou de comparação fornecerá uma superfície de contorno da diferença nas elevações entre as superfícies mais importante e de base. Pode-se usar a superfície de comparação para calcular o volume entre as duas superfícies.

 Ver também

Superfície Mais Importante

Selecionar a Superfície Mais Importante requerida a partir da lista suspensa. Usar o campo pasta para selecionar a pasta apropriada como requerido.

 Ver também

Superfície de Base

Selecionar a Superfície de Base requerida a partir da lista suspensa. Usar o campo pasta para selecionar a pasta apropriada como requerido.

 Ver também

Nova Surfície

Introduzir o nome da superfície de comparação. O nome necessta ser único no projeto atual.

Método de Comparação

Selecionar o método de comparação. Escolher de:

  Simples

  Detalhado

 Ver também


Calculando o Volume Entre Duas Superfícies

Usando a opção volume Vazio é possível se calcular os volumes de corte e encher entre duas superfícies usando uma superfície de comparação. A elevação de Base é configurada para o ponto mais baixo no modelo de contorno e a elevação Superior é configurada para zero. As linhas de contorno zero indicam onde existe uma mudança na área de corte para encher. Isto significa que o volume calculado acima na elevação Superior é a soma dos volumes de todas as áreas de encher. A soma dos volumes de todas as áreas de corte é retornada no volume Vazio entre a elevação de Base e a elevação Superior.

Se o volume de uma área particular de corte ou encher é requerida isto pode ser conseguido se definindo um limite de inclusão em torno da área para a qual o volume individual é necessário. O modelo é então reformado e a opção do volume Vazio é usada neste modelo, com a elevação de Base sendo outra vez configurada para o ponto mais baixo no modelo e a elevação Superior sendo configurada para zero. Se a área envolvida é uma área de encher o volume de encher será retornado como o volume acima da elevação Superior. Se a área envolvida é uma área de corte o volume de corte calculado será o volume Vazio entre a elevação Superior e a elevação de Base.

 Ver também


Superfícies Mais Importante e da Base

A seleção da superfície mais importante e da superfície da base define a direção das diferenças de elevação.

Isto é, qualquer área na superfície mais importante mais alta do que a área correspondente na superfície da base será mostrada como uma área de elevação positiva.

Qualquer área na superfície mais importante mais baixa do que a superfície da base será mostrada como uma área de elevação negativa. Áreas que não são comuns à ambas superfícies não irão aparecer na superfície de comparação.


Método de Comparação

Selecionar o método de comparação.

Simples

Isto é uma comparação de dois modos ponto e superfície. Todos os pontos em ambas as superfícies mais importante e da base são projetadas na outra superfície, e a diferença de elevação calculada. Esta diferença de elevação e posição da coordenada formam as coordenadas modelo para a superfície de comparação. Quando contornada, a superfície de comparação irá representar o relacionamento corte encher entre as superfícies comparadas. Ver Figura 1.

Desenho 1 : Comparação de Superfície Simples

Detalhada

Comparação detalhada inicialmente tem o mesmo processa que comparação simples. Em adição, comparação detalhada irá formar uma coordenada em cada interseção de um lado do triângulo de uma superfície, com um lado do triângulo de outra superfície, no plano horizontal. Usando este método a quantidade máxima de informação pode ser tirada dos dois modelos. A superfície de comparação resultante é mais detalhada porque usa formações de triângulos (e portanto usando informação de linhas de interrupção) das duas superfícies. O método detalhado irá demorar mais tempo do que o método simples. Ver Figura 2.

Desenho 2 : Comparação Detalhada da Superfície

NOTA: Todas as linhas de interrupção e limites tanto na superfície mais importante e da base serão ignoradas no processamento da superfície de comparação. Se os limites são necessários, os mesmos terão que ser adicionados após a operação de Comparar e a superfície de comparação terá que ser atualizada. Não é possível definir linhas de interrupção em uma superfície de comparação. Usando Adicionar linha será capaz de incluir linhas de interrupção em uma atualização da superfície de comparação, mas o resultado será incorreto e sem sentido. Isto porque a superfície de comparação é modelada nos pontos de superfície cujas elevações são diferenças entre pontos do banco de dados e linhas de interrupção podem somente ser definidas com pontos do banco de dados.


Menu Ferramentas

Use o menu Ferramentas para fazer cálculos e trabalhar com os dados. Ele possui os seguintes comandos:

Relatório do Volume

Reconstruir Superfície

Comparar Superfícies


Ampliar
Visualizar / Ampliar

	Clique a ferramenta Ampliar na barra de ferramentas Visualizar
Use esta ferramenta para examinar mais de perto uma seção da janela de gráficos.

Quando tiver selecionado a ferramenta Ampliar:

1.	Mova o apontador sobre a janela de gráficos. Aparece o apontador com a lente de aumento, contendo um sinal de mais. Fios cruzados sobre o apontador lente de aumento marcam o ponto quente.

2.	Faça um dentre o seguinte:

•	Clique numa posição na janela de gráficos para ampliar duas vezes, com o centro no ponto quente.

•	Clique e arraste o apontador através da janela de gráficos para criar um retângulo que contenha a área que você deseja ampliar. Mais pequena a área, maior será a mudança de escala. Quando o mouse é solto, o conteúdo da área contida no retângulo ocupa toda a janela de gráficos.

NOTAS:

Para cancelar a operação atual da ferramenta ampliar, aperte Esc enquanto o lado esquerdo do mouse estiver apertado.

Para visualizar uma janela flutuante da área ampliada, aperte Shift enquanto estiver efetuando a operação da ampliação.


Diminuir
Visualizar / Diminuir

	Clique a ferramenta Diminuir na barra de ferramentas Visualizar
Use esta ferramenta para visualizar uma área maior na janela de gráficos.

Quando tiver selecionado a ferramenta Diminuir:

1.	Mova o apontador sobre a janela de gráficos. Aparece o apontador com a lente de aumento, contendo um sinal de menos. Fios cruzados sobre o apontador lente de aumento marcam o ponto quente.

2.	Faça um dentre o seguinte:

•	Clique numa posição na janela de gráficos. A escala da janela de gráficos muda e centra-se na posição do ponto quente.

•	Clique e arraste o apontador através da janela de gráficos para criar um retângulo que contenha a área que você deseja e solte o botão do mouse. A escala da janela de gráficos muda, e é apresentada a área previamente contida no retângulo. Para abandonar a ferramenta Diminuir, volte ao ponto onde você iniciou o arraste antes de soltar o botão do mouse.

NOTAS:

Para cancelar a operação atual da ferramenta diminuir, aperte Esc enquanto o lado esquerdo do mouse estiver apertado.

Clique e arraste um retângulo na janela de gráficos. Quando a operação diminuir é efetuada, a área previamente contida no retângulo é apresentada. Menor o retângulo, maior será a escala de mudança.


Pan
Visualizar / Pan

	Clique na ferramenta Pan na barra de ferramentas Visualizar
Use esta ferramenta para mudar o conteúdo da janela de gráficos para que apresente uma área diferente da visualização da tela. A ferramenta Pan move a origem da visualização.

Quando tiver selecionado a ferramenta Pan:

1.	Mova o apontador sobre a janela de gráficos. Aparece o apontador em forma de mão. Fios cruzados sobre o apontador em forma de mão marcam o ponto quente.

2.	Faça um dentre o seguinte:

•	Clique numa posição na janela de gráficos. Aquela torna-se o novo centro da janela.

•	Clique e arraste o apontador em forma de mão na direção e na distância que você deseja fazer o Pan. Aparece uma linha para indicar a direção e distância que a tela deve mover-se. Solte o botão. A visualização da tela move-se para esta nova posição. Para abandonar a ferramenta Pan, volte o apontador em forma de mão ao ponto onde você iniciou o arraste antes de soltar o botão do mouse.

NOTAS:  Para cancelar a operação atual da ferramenta Pan, aperte Esc enquanto o lado esquerdo do mouse estiver apertado.


Pan Para
Visualizar / Pan Para

Use este comando para fazer pan e escala para uma localização particular na janela gráficos.

Abre-se o diálogo Pan Para.

Centro da visualização

Este grupo de campos lhe permite completar ações de preenchimento de campo, tais como a especificação de um nome ou localidade para o centro da visualização.

Nome do ponto	Use este campo para inserir o nome do ponto que deve ser o centro da visualização. Os campos Leste e Norte serão atualizados automaticamente.

Leste/Norte	Use estes campos para inserir o centro da visualização, se você não souber o nome do ponto.

Raio para visualização

O campo Raio para visualização ajusta a localidade da visualizaçãoa atual.

O centro da tela move-se na distância do raio que você especificar, dependendo da orientação da janela de gráficos, como definido no seguinte desenho:

Desenho 1: Orientação na tela


Zoom Extensões
Visualizar / Zoom Extensões

	Clique a ferramenta Zoom Extensões na barra de ferramentas Visualizar
Use este comando para visualizar todos os pontos visíveis da superfície atual.

Ao selecionar o comando Zoom Extensões, a janela de gráficos ajusta-se automaticamente de modo que todos os dados sejam visíveis.


Zoom prévio
Visualizar / Zoom prévio

	Clique a ferramenta Zoom prévio na barra de ferramentas Visualizar
Use este comando para voltar a cada uma da visualizações anteriores.


Janela Flutuante
Visualizar / Janela Flutuante

	Clique a ferramenta Janela Flutuante na barra de ferramentas Visualização.

Use este comando para apresentar a Janela Flutuante. Quando aberta, a Janela Flutuante sempre permanece em cima.

A janela flutuante fornece uma outra visualização. Como em outras janelas de gráficos, pode-se usar o preenchimento de campo e o zoom dentro da janela flutuante.

Isto significa, por exemplo, pode-se usar a janela flutuante como uma ferramenta para fornecer uma visão geral das janelas de gráficos. Ambas janelas podem ser usadas para operações usuais (tais como preenchimento de campos, seleção e zoom).

NOTA: Visualização / Zoom Extensões opera na janela de gráficos. Se você desejar executar o Zoom Extensões na janela flutuante, clique o menu de atalhos.

Para obter uma visualização ampliada da janela flutuante, selecione a ferramenta Ampliar, especifique na janela de gráficos a área a ser ampliada, apertando a tecla Shift e arrastando com o Zoom na ferramenta.

Para obter uma visualização ampliada na janela de gráficos, selecione a ferramenta Ampliar e especifique na janela flutuante a área a ser visualizada, apertando a tecla Shift e selecionando o ponto na janela de gráficos de onde fazer o zoom. Isso demonstra como a janela flutuante pode ser usada como uma visão geral.

NOTA: A barra do título da janela flutuante é apresentada como ativa quando a janela gráfico associada está ativa.


Barras de Ferramentas
Visualizar / Barras de Ferramentas

Use este comando para mostrar ou ocultar quaisquer barras de ferramentas.

Cada barra de ferramentas é uma série de ferramentas representadas por botões. Cada ferramenta é disponível como um comando de menu.

Barras de Ferramentas

Selecione a marca de verificação para mostrar ou ocultar a barra de ferramenta. Uma marca de verificação indica que a barra de ferramentas está visível.

Fechar

Clique Fechar para deixar o diálogo.

Todos

Clique Todos para mostrar todas as barras de ferramentas.

Nenhum

Clique Nenhum para ocultar todas as barras de ferramentas.

Reset

Clique Reset para restabelecer as barras de ferramentas para o arranjo padrão.

 Ver também


camadas
Visualizar / Camadas

	Use a ferramenta visibilidade da Camada na barra de ferramentas Visualizar.
Use este comando para mostrar ou ocultar as camadas na presente visualização.

Ao mostrar ou ocultar uma determinada camada, o software DTMLink™ mostra ou oculta as entidades nela.

NOTA: Mostrar ou ocultar uma camada no software DTMLink™é parecido com o ativar e desativar uma camada no AutoCAD. Desligando uma camada de linha de interrupção não desabilita-a de forma que não possa ser usada para atualizar a superfície. Isso não afeta o modelo da superfície, somente a visualização.

Camadas

A lista de camadas mostra os nomes de todas as camadas da superfície. Um sinal de seleção indica que a camada é visível. Selecione este sinal para uma determinada camada para mudar a camada para ligado e desligado.

Todos

Clique Todos para mostrar todas as camadas da lista.

Nenhum

Clique Nenhum para ocultar todas as camadas na lista.

SUGESTÃO: Quando a visibilidade de todas as camadas estiver desativada, não aparece nenhuma entidade na tela.

NOTA: O indicador de Camadas no quadro de indicadores está realçada quando uma camada está desativada.


Refrescar
Visualizar / Refrescar

Use este comando para refrescar a tela.

Escolha este comando (ou aperte F5) para redesenhar a visualização de gráficos quando a janela gráfico for sobrescrita ou estiver difícil para ler.


Opções
Visualizar / Opções

Use este comando para ajustar a apresentação de contornos e triângulos na janela de gráficos.

Pode-se:

 mostrar ou ocultar a apresentação de contornos e triângulos

 mudar os maiores e menores intervalos do contorno

 editar as cores dos contornos e triângulos

 editar os tipos de linha do contorno e dos triângulos

 editar o método de desenho do contorno

As etiquetas do diálogo Opções mostram os ajustes que você pode mudar no software DTMLink™.

As etiquetas são:

Opções da Linha

Avançado


Opções da Linha

Use a etiqueta Opções da Linha do diálogo Opções para especificar como os triângulos e contornos são apresentados na janela de gráficos.

Mostrar Contornos

Use o grupo Mostrar Contorno para ajustar as opções de linha para contornos. Selecione o quadro de verificação Mostrar Contornos para visualizar os contornos na janela de gráficos. Para ocultar os contornos, desmarque o quadro de verificação.  Mostrar contornos.

Intervalo	Ajuste o intervalo para os contornos maiores e menores.

SUGESTÃO: Use cores diferentes para apresentar os intervalos menores e maiores. Isso lhe permite visualizar rapidamente as mudanças de elevação.

As unidades especificadas neste campo são o grupo de unidades do software Geomatics Office.

Não pode-se ajustar um intervalo menor para um valor superior que o intervalo maior. O intervalo maior deve ser um múltiplo do intervalo menor.

Cor da pos	Ajuste a cor de apresentação dos contornos que estão acima do zero. Selecione uma cor da lista.

Use uma cor diferente para apresentar os intervalos maiores e menores. Isso lhe permite mudanças rapidamente mudanças na elevação.

Cor neg	Ajuste a cor de apresentação dos contornos que estão abaixo do zero. Selecione uma cor da lista.

Use uma cor diferente para apresentar os intervalos maiores e menores. Isso lhe permite visualizar rapidamente mudanças na elevação.

Tipo de linha	Escolha um tipo de linha da lista.

Mostrar Triângulos

Use o grupo Mostrar Triângulos para ajustar as opções de linha para os triângulos. Selecione o quadro de verificação Mostrar Triângulos para mostrar os triângulos na janela de gráficos. Para ocultar os triângulos,desmarque o quadro de verificação.

Cor	Este campo ajusta a cor da apresentação dos triângulos. Selecione uma cor da lista. Esta cor mostra as bordas dos triângulos.

Tipo de linha	Escolha um tipo de linha da lista.

Aplicar

Clique Aplicar para aplicar as mudanças e manter o diálogo Opções aberto.

OK

Clique OK para aplicar as mudanças e deixar o diálogo.


Opções Avançadas

Use a etiqueta Avançado no diálogo Opções para definir o alcance de contornos e como eles apresentam-se na janela de gráficos.

Desenhar contornos como linhas

Selecione a opção desenhar contorno como linhas para apresentar linhas retas entre cada triângulo no modelo.

Desenhar contornos como curvas

Selecione a opção Desenhar contornos como curvas para apresentar um contorno mais realístico entre cada triângulo no modelo.

Use o cursor da curva mais teso para especificar o quanto reta a curva é. Isto é, ajustando o cursor para a tensão máxima da curva produz uma linha reta. A posição padrão do cursor geralmente produz curvas que são um conforto para os olhos.

SUGESTÃO: Use o cursor para controlar situações incomuns, onde um contorno cruza o outro devido à suavização da curva.

Mostrar todos contornos

Selecione a opção Mostrar todos contornos para apresentar todos os contornos num modelo.

Mostrar contornos entre

Selecione a opção Mostrar contornos entre para apresentar todos os contornos dentro do alcance de altura especificado.

Elevação Mínima	Insira no campo Elevação Mínima a elevação mínima dos contornos a serem apresentados. O valor que aparece por padrão é o ponto mais baixo registrado no modelo.

SUGESTÃO: Clicar Mais Alto para selecionar o valor de elevação máximo.

Elevação Máxima	Insira no campo Elevação Máxima a elevação máxima dos contornos a serem apresentados. O valor que aparece por padrão é o ponto mais alto registrado no modelo.

SUGESTÃO: Clicar Mais Baixo para selecionar o valor de elevação máximo.

Aplicar

Clique Aplicar para aplicar as mudanças e manter o diálogo Opções aberto.

OK

Clique OK para aplicar as mudanças e deixar o diálogo.


Propriedades
Visualizar / Propriedades

	Clique a ferramenta Propriedades na barra de ferramentas Padrão

Use o Janela de Propriedade para visualizar as propriedades de cada elemento.

NOTA: Não pode-se editar as entidades na Janela de Propriedade. Para editar elementos, retorne ao software Geomatics Office da Trimble e use a Janela de Propriedades para editar as entidades. Crie uma nova superfície, usando as entidades editadas.

A Janela de propriedade mostra os nomes apropriados e valores da entidade selecionada.

SUGESTÃO: Para mudar o tamanho da Janela de Propriedade, clique e arraste na armação da janela. Para mudar a divisão dentro da janela clique e arraste na barra dividida.


Janela de Propriedade

A Janela de Propriedade lhe permite visualizar as propriedades de cada elemento. Você não pode editar as propriedades. Ele mostra os nomes e valores apropriados do elemento.

NOTA: Pode-se selecionar somente um elemento de cada vez.


Menu Visualização

O menu Visualização fornece comandos para controle e manutenção da apresentação de superfície de contorno na janelas de gráficos. Os seguintes comandos são disponíveis:

Ampliar

Diminuir

Pan

Pan Para

Zoom Extensões

Zoom Prévio

Janela Flutuante

Barras de Ferramenas

Camadas

Refrescar

Opções

Propriedades


Nova Janela
Janela / Nova Janela

Use este comando para abrir outra janela para a superfície atual.

Use este comando para abrir uma nova janela com o mesmo conteúdo da janela ativa. Pode-se abrir múltiplas janelas para apresentar diferentes partes ou visualizações ao mesmo tempo. Se você mudar o conteúdo em uma janela, todas as outras janelas refletem estas mudanças. Quando você abre uma nova janela, ela torna-se a janela ativa e é apresentada no alto de todas as outras janelas abertas.


Cascata
Janela / Cascata

Use este comando para mudar o tamanho de janelas e diálogos abertos na área de trabalho e classificá-los em sobreposição, de cima na esquerda para baixo na direita.

Ao fazer uma cascata com as janelas, elas serão dispostas em camadas de modo que seja possível ver as barras de títulos de todas as janelas na área de trabalho.


Lado a Lado
Janela / Lado a Lado

Use este comando para mover e modificar o tomanho de janelas e diálogos abertos na área de trabalho e classificá-las para formar uma pilha.


Organizar Ícones
Janela / Organizar Ícones

Use este comando para re-organizar os ícones de janelas minimizadas em ordem na janela. Ele organiza os ícones na parte inferior da janela.


Lista de Janelas
Janela / Lista de Janelas

Use este a seção inferior deste menu para apresentar uma lista de janelas atualmente abertas na área de trabalho. A janela ativa está marcada.

Clique o nome de uma determinada janela ou diálogo para torná-lo ativo.


Menu Janela

O menu Janela contém comandos para visualização  de opções. Possui os seguintes comandos:

Nova Janela

Cascata

Lado a lado

Organizar Ícones

Lista de Janelas na tela


Cruzamento de Limites

Quando for detectado cruzamento de limite, aparece a seguinte mensagem:

Foi detectado cruzamento de limites. Deseja visualizar o relatório?

Clique Sim para visualizar o relatório.

O relatório de cruzamento de limites mostra as duas linhas cruzadas. Descreve as linhas cruzadas usando um nome de ponto, o início das coordenadas norte e leste da linha e o final das coordenadas norte e leste da linha.

Um relatório de cruzamento de limites parece com o sequinte exemplo:

Relatório de Cruzamento de Limites

Tutorial do Projeto DTMLink

Nome do proj	DTMLink tutorial
Superfície	Superfície1
Unidades	Metros
Data impress	29/07/99 11:56am
Cruzamento de Limites detetado

                Ponto        Norte         Leste    Elevação

Linha de         187     4408.302     2482.427      119.708

      Para       179     4430.895     2442.447      119.694   Cruzamentos

Linha de         181     4443.678     2465.296      119.722

      Para       187     4408.302     2482.427      119.708

O relatório é armazenado na sua pasta de relatórios C:\Trimble Geomatics Office\Projects\xx\Relatorios\DTMLink\yy onde XX é o nome do projeto e yy é o nome da superfície. Pode-se visualizar o relatório mais tarde abrindo-o no Microsoft Windows Explorer a partir desta pasta.


Cruzamento de linhas de interrupção

Quando cruzamentos de linhas de interrupção são detectados, aparece a seguinte mensagem:

Foi detectado cruzamento de linhas de interrupção. Deseja visualizar o relatório?

Clique Sim para visualizar o relatório.

O relatório de cruzamento de linhas de interrupção mostra as duas linhas cruzadas. Descreve as linhas cruzadas usando um nome de ponto, o início das coordenadas norte e leste da linha e o final das coordenadas norte e leste da linha.

Um relatório de cruzamento de linhas de interrupção parece com o sequinte exemplo:

Relatório de Cruzamento de Linhas de Interrupção

Tutorial do Projeto DTMLink

Nome do Proj	DTMLink Tutorial
Superfície	Superfície1
Unidades	Metros
Data impress	28/07/99 3:23pm
Cruzamento de linhas de interrupção detetada

                Ponto        Norte         Lest    Elevação

Linha de          38     4456.360     2461.687      110.358

      para         187     4408.302     2482.427      119.708 Cruzamentos

Linha de         182     4447.684     2476.296      120.100

       para      181     4443.678     2465.296      119.722

Linha de         190     4411.104     2461.389      118.697

      para       183     4442.452     2486.146      120.193 Cruzamentos

Linha de          38     4456.360     2461.687      110.358

       para      187     4408.302     2482.427      119.708

O relatório é armazenado na sua pasta de relatórios C:\Trimble Geomatics Office\Projects\xx\Relatorios\DTMLink\yy onde XX é o nome do projeto e yy é o nome da superfície. Pode-se visualizar o relatório mais tarde abrindo-o no Microsoft Windows Explorer a partir desta pasta.


Coordenadas Ajustadas

Se uma linha de interrupção passa muito perto de um ponto de superfície, a altura daquele ponto próximo é ajustada para um valor de altura interpolado da linha de interrupção. Isso acontece para evitar que contornos não comuns sejam forçados à linha de interrupção do ponto próximo.

Se você não desejar que este ponto seja ajustado, você pode mudar o norte e o leste de modo que o ponto esteja ligeiramente fora da linha de interrupção.

Depois que o sistema DTMLink ajusta as coordenadas, aparece a seguinte mensagem:

Ponto da coordenada ajustado; deseja visualizar o relatório?

Clique Sim para visualizar o relatório.

O relatório das Coordenadas Ajustadas mostram os detalhes da coordenada do ponto ajustado e os detalhes da coordenada revisada.

Um relatório de Coordenadas Ajustadas parece com o seguinte exemplo:

Relatório de Coordenadas Ajustadas

Tutorial do Projeto DTMLink

Nome do Proj	DTMLink tutorial
Superfície	Superfície1
Unidades	Metros
Data impress	28/07/99 2:37pm
Coordenadas Ajustadas

Ponto da coordenada adjustado

elevação configurada para elevação das linhas de interrupção interpoladas

                                 Ponto           Norte            Leste       Elevação

Detalhes das Coordenadas:          2453        4573.147        5734.531          23.000

Detalhes das Coordenadas Revisado: 2453        4573.147        5734.531          53.798

O relatório é armazenado na sua pasta de relatórios C:\Trimble Geomatics Office\Projects\xx\Relatorios\DTMLink\yy onde XX é o nome do projeto e yy é o nome da superfície. Pode-se visualizar o relatório mais tarde abrindo-o no Microsoft Windows Explorer a partir desta pasta.


Pontos Duplicados

Durante a criação da superfície do contorno todos os pontos são verificados para encontrar coordenadas norte e leste duplicadas. Se pontos duplicados são encontrados, o módulo DTMLink descarta um destes pontos.

Um relatório de Pontos Duplicados é criado quando pontos são descartados. Um exemplo de relatório de Pontos Duplicados segue abaixo:

Relatório de Pontos Duplicados

Tutorial do Projeto DTMLink

Nome do Proj	DTMLink Tutorial
Superfície	Superfície1
Units	Metros
Data impress	28/07/99 4:02pm
Pontos Duplicados Lidos

                              Ponto          Norte           Leste      Elevação

Ponto retido:                  55138       4452.923       2487.237         55.912

Ponto descartado                 138       4452.923       2487.237        116.912

Ponto retido:                   1877       4408.302       2482.427         19.708

Ponto descartado:                187       4408.302       2482.427        119.708

O relatório é armazenado na sua pasta de relatórios C:\Trimble Geomatics Office\Projects\xx\Relatorios\DTMLink\yy onde XX é o nome do projeto e yy é o nome da superfície. Pode-se visualizar o relatório mais tarde abrindo-o no Microsoft Windows Explorer a partir desta pasta.

NOTA: O software DTMLINK não suporta faces verticais.


Tolerância da Curva

Curvas e arcos podem definir limites e linhas de interrupção.

Para permitir computações de triângulos com linhas de interrupção e limites que sejam curvas e arcos, a curva ou arco são representados como uma série de pequenos segmentos de linhas.

O comprimento do segmento de linha é controlado pela tolerância da Curva. A tolerância da curva é a distância máxima permitida de qualquer ponto ao longo da série de segmentos de linhas à curva ou arco, a uma perpendicular ao segmento de linha.

A tolerância da Curva é ajustada a 0,02m.


Mensagens de erro

Coordenadas Ajustadas

Cruzamento de Linhas de Interrupção

Cruzamento de Limites

Ponto Duplicado

Nomes Inválido de Pontos

Coordenada não traça até um ponto


Nome Inválido de Ponto

Se um nome inválido para ponto é inserido em um diálogo, aparece a seguinte mensagem de erro:

X não é um nome válido para ponto

Onde X é o nome do ponto.

Deve-se inserir um nome de ponto que tenha sido definido como parte do modelo da superfície do contorno. Se você necessitar um ponto que não foi definido inicialmente, proceda como no seguinte:

1.	Volte à tela do Trimble Geomatics Office.

2.	Selecione o comando de menu Ferramentas / DTMLink / Superfície existente.

Aparece o diálogo Superfície existente.

3.	Adicione novos pontos à superfície. Consulte a Ajuda do Trimble Survey Office, onde encontrará maiores informações sobre o diálogo Superfície Existente.

Para maiores informações, referir-se à Ajuda online dentro do software Trimble Geomatics Office™.


A coordenada não traça até um ponto

Se forem inseridas em um diálogo coordenadas que não combinam com as coordenadas do atual ponto de superfície, aparece a seguinte mensagem de erro:

A coordenada não traça até um ponto.

Deve-se inserir coordenadas de um ponto existente no campo Norte e Leste.

Se você necessitar as coordenadas inseridas, proceda como no seguinte:

1.	Volte à tela do Trimble Geomatics Office.

2.	Adicione um novo ponto com as coordenadas que você necessita, se elas não existirem.

3.	Selecione o comando de menu Ferramentas / DTMLink / Superfície existente.

Aparece o diálogo Superfície existente.

4.	Adicione novos pontos à superfície. Consulte a Ajuda do Trimble Survey Office, onde encontrará maiores informações sobre o diálogo Superfície existente.

Para maiores informações sobre o diálogo Superfície Existente, referir-se a Ajuda online dentro do software Trimble Geomatics Office™.


Incluir Ponto

Use a ferramenta Incluir Ponto [image] na barra de ferramenta Superfície ou o comando Desenhar / Incluir Ponto para incluir um ponto no Modelo Contornar Superfície.

Desenho / Incluir Ponto

Use este comando para abrir o diálogo Incluir Ponto. Este diálogo somente é disponível no menu de comando.

O cursor muda para [image] quando o diálogo Incluir Ponto está ativo.

Use os campos do diálogo Incluir Ponto para selecionar o ponto a ser incluído na superfície.

Ponto a incluir

Use o grupo Ponto a incluir para inserir o nome do ponto ou coordenadas Norte e Leste do ponto para a serem incluídos na superfície.

Nome do ponto

Use o campo Nome do ponto para identificar o ponto para inserir. Se este for um nome válido de ponto, os campos Norte e Leste são preenchidos automaticamente.

NOTA: Se você inserir um nome de ponto de superfície inválido, aparece a seguinte mensagem de erro:

X não é um nome de ponto válido

Onde X é o nome do ponto.

Norte / Leste

Use estes campos para inserir as coordenadas do ponto da superfície se você desconhecer o nome do ponto.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste para o ponto no grupo Ponto a Incluir.

NOTA: Se você inserir coordenadas que não combinem com as coordenadas de um ponto válido de superfície, aparece a seguinte mensagem de erro:

A coordenada não traça até um ponto

Aplicar

Clique Aplicar para atualizar a superfície e reajustar o diálogo, se você deseja inserir outro ponto para incluir.

Se você deseja incluir somente um ponto, clique OK para atualizar automaticamente a superfície e fechar o diálogo.

Ferramenta Incluir Ponto

Clique a ferramenta Incluir Ponto [image] na barra de ferramenta Superfície para incluir um ponto que não faça parte da superfície.

O cursor muda para [image] quando a ação Incluir Ponto está ativa.

Selecione o ponto para incluir a partir da janela gráficos.

A ação Incluir Ponto atualiza a superfície automaticamente.

AVISO: Se um triângulo foi previamente apagado entre os pontos o triângulo será recuperado.

SUGESTÃO: Use Editar / Desfazer para desfazer a ação Incluir Ponto.


Excluindo um Ponto

Use a ferramenta Excluir Ponto [image] na barra de ferramenta Superfície ou o comando Desenhar / Excluir Ponto para excluir um ponto do modelo contornar superfície.

Desenhar / Excluir Ponto

Use este comando para abrir o diálogo Excluir Ponto. Este diálogo somente é disponível do comando do menu.

O cursor muda para [image] quando o diálogo Excluir Ponto está ativo.

Use os campos do diálogo Excluir Ponto para selecionar o ponto a ser excluído da superfície.

Ponto a excluir

Use o grupo Ponto a excluir para inserir o nome do ponto ou as coordenadas Norte e Leste do ponto a ser excluído da superfície.

Nome do ponto

Use o campo Nome do ponto para identificar o ponto a ser excluído. Se este for um nome de ponto de superfície válido, os campos Norte e Leste serão preenchidos automaticamente.

NOTA: Se você inserir um nome de ponto de superfície inválido, aparece a seguinte mensagem de erro:

X não é um nome de ponto válido

Onde X é o nome do ponto.

Norte / Leste

Use estes campos para inserir as coordenadas do ponto da superfície se você desconhecer o nome do ponto.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste para o ponto no grupo Ponto para excluir.

NOTA: Se você inserir coordenadas que não combinem com as coordenadas de um ponto válido de superfície, aparece a seguinte mensagem de erro:

A coordenada não traça até um ponto .

Aplicar

Clique Aplicar para atualizar a superfície e reajustar o diálogo, se você deseja inserir outro ponto para excluir.

Se você deseja excluir somente um ponto, clique OK para atualizar automaticamente a superfície e fechar o diálogo.

Ferramenta Excluir Ponto

Clique a ferramenta Excluir Ponto [image] na barra de ferramenta Superfície para evitar que um ponto seja usado no modelo da superfície.

O cursor muda para [image] quando a ação Excluir Ponto está ativa.

Selecione o ponto para excluir a partir da janela gráficos.

Com esta opção, você não deve atualizar a superfície. A ação Excluir Ponto atualiza a superfície automaticamente.

NOTA: Aparece uma mensagem de erro se você selecionar um ponto que não seja parte da superfície.

SUGESTÃO: Use Editar / Desfazer para desfazer a ação Excluir Ponto.

Um exemplo da utilidade da ação Excluir Ponto é quando um ponto causa contornos irregulares devido à sua imprecisão. Pode-se usar essa ação para ignorar o ponto.


Permutar Triângulos

Use a ferramenta Permutar Triângulos [image] na barra de Superfície o no comando Desenho / Permutar Triângulos para mudar dois triângulos no modelo de superfície do contorno.

Desenho / Permutar Triângulos

Use este comando para abrir o diálogo Permutar Triângulos. Este diálogo somente é disponível no menu de comando.

O cursor muda para [image] quando o diálogo Permutar Triângulos está ativo.

Use os campos no diálogo Permutar Triângulos para selecionar os triângulos que devem ser permutados na superfície.

Primeiro Triângulo

Use o grupo Primeiro Triângulo para identificar o primeiro triângulo a ser permutado.

Norte / Leste

Insira quaisquer coordenadas dentro do triângulo para identificar o primeiro triângulo a ser permutado.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste.

Segundo Triângulo

Use o grupo Segundo Triângulo para identificar o segundo triângulo a ser permutado.

Norte / Leste

Insira quaisquer coordenadas dentro do triângulo para identificar o segundo triângulo a ser permutado.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste.

Aplicar

Clique Aplicar para permutar os triângulos que formam quadriláteros.

Clique OK para permutar os triângulos e fechar o diálogo.

SUGESTÃO: Use Editar / Desfazer para desfazer a ação Permutar Triângulos.

Ferramenta Permutar Triângulos

Clique a ferramenta Permutar Triângulos [image] na barra de ferramenta Superfície para mudar o modelo da superfície, permutando triângulos.

O cursor muda para [image] quando a ação Permutar Triângulos está ativa.

Selecione o primeiro triângulo que deve ser permutado. Este triângulo aparece na tela em cor verde.

Selecione o segundo triângulo. Se os dois triângulos selecionados formarem um quadrilátero, os ângulos dos quais partem as diagonais são trocados e dois novos triângulos são criados. Veja o Desenho 1 abaixo.

Permutando Triângulos

Dois triângulos adjacentes juntos formam um quadrilátero.

Veja o Desenho 1.

Desenho 1 Triângulos

A ferramenta Permutar Triângulos ou o comando Desenho / Permutar Triângulos somente funciona com quadriláteros convexos. Se um quadrilátero côncavo for selecionado, aparece uma mensagem de erro.

Quando você permuta triângulos, o gradiente da altura entre pontos forma-se ao longo dos lados dos novos triângulos. A linha de contorno que é produzida pode ser ligeiramente diferente e pode resultar em uma representação mais verdadeira.

Algumas vezes a permuta de triângulos não melhora a superfície do contorno. Por exemplo, isso acontece se a superfície do contorno é irregular.


Apagando um Triângulo

Use a ferramenta Apagar Triângulo [image] na barra de ferramentas Superfície ou no comando Desenho / Apagar Triângulo para apagar um triângulo no modelo da superfície do contorno.

Desenho / Apagar Triângulo

Use este comando para abrir o diálogo Apagar Triângulo. O diálogo Apagar Triângulo somente é disponível no comando do menu.

O cursor muda para [image] quando o diálogo Apagar Triângulo está ativo.

Use os campos no diálogo Apagar Triângulo para selecionar os triângulos a serem apagados na superfície.

Triângulo para Apagar

Use o grupo Triângulo para Apagar para identificar o triângulo para apagar.

Norte / Leste

Insira quaisquer coordenadas dentro do triângulo para identificar o triângulo para apagar.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste.

Aplicar

Clique Aplicar para atualizar a superfície e reajustar o diálogo se você desejar inserir outro triângulo a ser excluído.

Se você desejar excluir somente um triângulo, clique OK para atualizar automaticamente a superfície e fechar o diálogo.

SUGESTÃO: Use Editar / Refazer para recuperar triângulos apagados.

Ferramenta Apagar Triângulo

Clique a ferramenta Apagar Triângulo [image] na barra de ferramenta Superfície para mudar o modelo da superfície com a remoção de triângulos.

O cursor muda para [image] quando a ação Apagar Triângulo está ativa.

Selecione o triângulo para apagar da tela de gráficos.

Triângulos que são removidos

Triângulos removidos não são incluídos no Modelo Digital de Terreno (DTM). Isso é útil quando se quer um método rápido e eficiente para organizar a margem externa do modelo da superfície onde contornos são formados em triângulos compridos, com forma não realística.

AVISO: Os triângulos apagados não tomam nova forma em uma atualização de superfície, a não ser que um limite tenha sido adicionado ao modelo ou tenha sido editado no modelo.

SUGESTÃO: Se o modelo for reconstruído após o apagamento de triângulos e linhas limítrofes tenham sido editadas, os triângulos apagados tomarão nova forma como parte do modelo. Se triângulos apagados devem ser mantidos após uma atualização do modelo, delimite os pontos respectivos antes da atualização.


Adicionar Linha

Use as ferramentas Adicionar Linha da barra de ferramentas Superfície o comando Desenho / Adicionar Linha para adicionar uma interrupção de linha ou limite no modelo da superfície do contorno.

Desenho / Adicionar Linha

Use este comando para abrir o diálogo Adicionar Linha. Este diálogo somente é disponível no comando do menu.

Use os campos no diálogo Adicionar Linha para adicionar uma linha de interrupção ou limite à superfície do contorno.

Tipo de linha

Use o grupo tipo de linha para especificar o tipo de linha desejado.

A tabela explica as opções:

Para adicionar…	Selecione…
Uma linha de interrupção	o quadro de verificação do tipo de linha da linha de interrupção
Um limite	o quadro de verificação do tipo de linha do Limite. Pode-se especificar o tipo de limite escolhendo seja a opção Incluir ou a opção Excluir.
Tanto um tipo de linha de interrupção como o tipo de linha do limite	ambos quadros de verificação e a especificação do tipo do limite através da escolha da opção Incluir ou a opção Excluir. Isto é, pode-se ter um tipo de linha da linha de interrupção com um Limite excluir ou um tipo de linha de interrupção com Limite incluir.
Início de linha

Use o grupo Início de linha para inserir o nome do ponto ou as coordenadas Norte e Leste para o início de linha.

Nome do ponto

Use o campo Nome do Ponto para identificar o ponto de início para a linha. Se esse for um nome válido de ponto de superfície, os campos Norte e Leste são preenchidos automaticamente.

NOTA: Se você inserir um nome de ponto de superfície inválido, aparece a seguinte mensagem de erro:

X não é um Nome de ponto válido

Onde X é o nome do ponto.

Norte / Leste

Use estes campos para inserir as coordenadas do ponto da superfície se você desconhecer o nome do ponto.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste para o início de linha.

Fim de linha

Use o grupo Fim de linha para inserir o nome do ponto ou as coordenadas Norte e Leste para o fim de linha.

Nome do ponto

Use o campo Nome do Ponto para identificar o ponto de fim para a linha. Se esse for um nome válido de ponto de superfície, os campos Norte e Leste são preenchidos automaticamente.

NOTA: Se você inserir um nome de ponto de superfície inválido, aparece a seguinte mensagem de erro:

X não é um Nome de ponto válido

Onde X é o nome do ponto.

Norte / Leste

Use estes campos para inserir as coordenadas do ponto da superfície se você desconhecer o nome do ponto.

SUGESTÃO: Use preencher o campo para inserir as coordenadas Norte e Leste para o fim da linha.

NOTA: Se você inserir coordenadas que não combinem com as coordenadas de um ponto de superfície válido, a ação Adicionar Linha não será ativada.

Adicionar

Clique Adicionar para adicionar a linha na superfície. O Ponto de fim torna-se o Ponto de início para a próxima linha. Adicione outro ponto final para continuar a linha.

SUGESTÃO: Se você estiver usando o preencher o campo para identificar o ponto, clique duas vezes no ponto final que a linha será adicionada automaticamente.

AVISO: Clicando Adicionar não atualiza a superfície. Clique Atualizar superfície para aplicar as linhas à superfície de contorno.

Atualizar superfície

Após adicionar linhas, o Indicador de atualização na barra de Status muda para mostrar que a superfície necessita ser atualizada.

Para atualizar a superfície antes de fechar o diálogo Adicionar linha, clique Atualizar superfície.

Para atualizar a superfície depois de fechar o diálogo Adicionar linha, aperte F4 ou use o comando Desenho / Atualizar superfície.

Envoltório Reduzido

Clique Envoltório Reduzido para criar um Limite incluir que delimita todos os pontos selecionados para o modelo do contorno. Este Limite incluir geralmente não cobre todas as definições detalhadas requeridas do limite, mas ele fornecerá uma definição inicial do limite incluir. Use as facilidades Adicionar Linha e Apagar Linha para editar esta definição inicial e criar a definição de limite requerida.

SUGESTÃO: Use Editar / Desfazer para desfazer a ação Adicionar linha.

Ferramentas Adicionar Linha

As ferramentas Adicionar Linha da barra de ferramentas Superfície lhe permite adicionar:

  Uma linha de interrupção

  Um excluir limite

  Um incluir limite

  Um incluir limite com uma linha de interrupção

  Um excluir limite com uma linha de interrupção


Apagando uma Linha

Use a ferramenta Apagar Linha [image] na barra de ferramenta Superfície ou comando Desenho / Apagar Linha para apagar uma linha  no modelo de superfície do contorno.

Desenho / Apagar Linha

Use este comando para abrir o diálogo Apagar Linha. Este diálogo somente é disponível no comando do menu.

Tipos de Linha para Apagar

Selecione os tipos de linhas para apagar na lista.

Os tipos disponíveis são:

Tipos de Linha	Esta opção faz o seguinte...
Todos	apaga toda linha selecionada na superfície que seja uma linha de interrupção ou limite selecionados. Em algumas circunstâncias uma linha pode ser um limite e uma linha de interrupção. Esta opção é a opção padrão.
Linhas de interrupção	apaga somente linhas de interrupção selecionadas
Incluir limites	apaga somente incluir limites selecionados
Excluir limites	apaga somente excluir limites selecionados
Incluir limites e linhas de interrupção	apaga somente incluir limites e linhas de interrupção selecionados
Excluir limites e linhas de interrupção	apaga somente excluir limites e linhas de interrupção selecionados.

Início de linha

Use o grupo Início da linha para inserir o nome do ponto ou as coordenadas Norte e Leste para o início de linha.

Nome do ponto

Use o campo Nome do Ponto para identificar o nome do ponto inicial para a linha.  Se este for um nome válido de ponto de superfície, os campos Norte e Leste são preenchidos automaticamente.

NOTA: Se você inserir um nome de ponto de superfície inválido, aparece a seguinte mensagem de erro:

X não é um nome de ponto válido

Onde X é o nome do ponto.

Norte / Leste

Use estes campos para inserir as coordenadas do ponto de início se você desconhecer o nome do ponto. Estes campos são somente para leitura e você não poderá inserir coordenadas neles.

Fim de linha

Use o grupo Fim de linha para inserir o nome do ponto ou as coordenadas Norte e Leste para o fim da linha.

Nome do ponto

Use o campo Nome do Ponto para identificar o nome do ponto final para a linha.  Se este for um nome válido de ponto de superfície, os campos Norte e Leste são preenchidos automaticamente.

NOTA: Se você inserir um nome de ponto de superfície inválido, aparece a seguinte mensagem de erro:

X não é um nome de ponto válido

Onde X é o nome do ponto.

Norte / Leste

Use estes campos para inserir as coordenadas do ponto final se você desconhecer o nome do ponto. Estes campos são somente para leitura e você não poderá inserir coordenadas neles.

SUGESTÃO: Selecione a linha na janela de gráficos quando o diálogo Apagar linha estiver ativo que tanto o campo ponto inicial como o ponto final serão inseridos automaticamente.

Aplicar

Clique Aplicar para apagar a linha.

Após selecionar a linha a ser apagada, o Indicador de atualização na barra de Status muda para mostrar que a superfície necessita ser atualizada.

Para atualizar a superfície antes de fechar o diálogo Apagar Linha, clicar Atualizar Superfície.

Para atualizar a superfície após fechar o diálogo Apagar Linha, aperte F4 ou use o comando Desenho / Atualizar superfície.

Clique Fechar para fechar o diálogo.

SUGESTÃO: Use Editar / Desfazer para desfazer a ação Apagar Linha.

Ferramenta Apagar Linha de Interrupção / Limite

Para apagar uma linha de interrupção ou limite usando a ferramenta Apagar Linha:

1	1	1.	Clique a ferramenta Apagar Linha de Interrupção / Limite [image] na barra de ferramenta Superfície.

2	2	2. Clique a seta ao lado direito da ferramenta para acessar a lista de tipos de linhas.

3	3	3. Selecione os tipos de linha que deseja apagar.

4	4	A opção selecionada da lista atua como um filtro e quando você clica sobre uma linha na janela de gráficos, a linha apaga-se se ela for uma linha do tipo específico de linha. Isso é útil onde existir mais de uma linha entre dois pontos e você deseja apagar somente as linhas de um tipo específico.

5	5	AVISO: O tipo de linha que você selecionar permanece o tipo padrão de linha até que outro tipo de linha seja selecionado ou o software DTMLink™ seja fechado.

6	6	O cursor muda para [image] quando a ação apagar linha estiver ativa.

7	7	4.	Selecione a linha limite ou a linha de interrupção para apagar.

8	8	Após apagar linhas, o Indicador de atualização na barra de Status muda para indicar que a superfície necessita se atualizada.

9	9	5. Para atualizar a superfície, aperte F4, ou use o comando Desenho / Atualizar superfície.

10	10	6. Desative a ferramenta selecionando outra ferramenta ou apertando F2.

11	11

NOTA: Uma situação na qual pode-se usar o Incluir tipo de linha limite:

Onde um edifício situa-se sobre o limite de uma superfície e você deseja editar o Incluir limite sem afetar o Limite excluir. Selecione o tipo de linha dos Limites incluir da lista e apague as linhas limites apropriadas na janela de gráficos.


Atualizando uma Superfície

Depois de adicionar linhas, o Indicador de atualização na barra de Status muda para indicar que a superfície necessita de atualização.

Selecione o comando Desenho / Atualizar superfície ou aperte F4 para atualizar a superfície e aplicar as linhas de interrupção e linhas de limite que foram adicionadas.

Clicar Atualizar superfície no diálogo Adicionar linha também atualiza a superfície.


Adicionar um Incluir limite com o Uso da Ferramenta Adicionar Limite Incluído

1.	Selecione a ferramenta Adicionar Limite Incluído [image] da barra de ferramenta Superfície.

O cursor muda para [image] quando a ação estiver ativa.

2.	Clique o ponto da superfície onde o limite inicia.

3.	Continue adicionando seções do Incluir limite, selecionando pontos da superfície.

Uma linha azul escuro aparece na tela entre os pontos Incluir limite.

4.	Volte ao primeiro ponto para fechar o limite. Se você não fechou o limite, o software DTMLink tenta fechar o limite quando a superfície é atualizada.

Após adicionar as linhas, o Indicador de atualização na barra de Estado muda para mostrar que a superfície necessita ser atualizada.

5.	Para atualizar a superfície, faça um dos seguintes:

•	Aperte F4.

•	Use o comando Desenho / Atualizar superfície.

6.	Para terminar adicionando ao limite, selecione outra ferramenta ou aperte F2.

NOTA: Para adicionar um incluir limite e uma linha de interrupção usando a ferramenta Adicionar Linha, aperte a seta ao lado direito da ferramenta Excluir limite e selecione Incluir Limite e Linha de Interrupção da lista de cascata.


Adicionar um Excluir limite com o Uso da Ferramenta Adicionar Limite Excluído

1.	Selecione a ferramenta Adicionar Limite Excluído [image] da barra de ferramenta Superfície.

2.	Clique o ponto da superfície onde o limite inicia.

O cursor muda para [image] quando a ação estiver ativa.

3.	Continue adicionando seções do Excluir limite, selecionando pontos da superfície.

Uma linha azul claro aparece na tela entre os pontos Excluir limite.

4.	Volte ao primeiro ponto para fechar o limite. Se você não fechou o limite, o software DTMLink tenta fechar o limite quando a superfície é atualizada.

Após adicionar as linhas, o Indicador de atualização na barra de Estado muda para mostrar que a superfície necessita ser atualizada.

5.	Para atualizar a superfície, faça um dos seguintes:

•	Aperte F4.

•	Use o comando Desenho / Atualizar superfície.

6.	Para terminar adicionando ao limite, selecione outra ferramenta.

NOTA: Para adicionar um excluir limite e uma linha de interrupção usando a ferramenta Adicionar Linha, aperte a seta ao lado direito da ferramenta Excluir limite e selecione Excluir Limite e Linha de Interrupção da lista de cascata.


Limites e Linhas de Interrupção: Detalhes Técnicos

Este tópico trata de como o Modelo Digital de Terreno (DTM) é criado e enfatiza alguns dos efeitos no modelo produzido pelo processamento de linhas de interrupção e limites.

Quando a superfície é criada, o software DTMLink™ forma triângulos entre os pontos da superfície. As linhas (que são bordas de triângulos) formadas entre os pontos da superfície adotam um grau constante.

Os seguintes tópicos são tratados:

  Limites

  Linhas de interrupção

  Efeitos do Processamento de Linhas de interrupção e Limites

Noções dos Limites

Existem dois tipos de limites: limites incluir e limites excluir. Um limite incluir é uma linha que define uma área da superfície que é incluída no modelo.  Um limite excluir é uma linha que define uma área da superfície que deve ser excluída do modelo. Por exemplo, se os lados de um edifício fossem definidos como um limite excluir, então as linhas de contorno não serão desenhadas através do edifício. Limites excluir devem ser definidos dentro dos limites incluir, mas se um limite incluir for criado dentro do limite externo, o limite excluir sobrescreve o limite incluir.

Um limite é uma figura fechada. Se um limite não estiver fechado, uma tentativa de fechá-lo automaticamente acontece quando a superfície é atualizada.

Noções das Linhas de Interrupção

As linhas de interrupção são uma série de linhas que possuem um grau constante. O software DTMLink usa o grau de cada linha para ajustar o modelo do triângulo. Por exemplo, o topo de uma colina ou lateral de uma estrada podem ser definidos como linha de interrupção para evitar que o software DTMLink faça interpolações incorretas na linha. Obviamente, as linhas de interrupção não atravessam umas as outras, a não ser que elas passem por um ponto comum, onde elas cruzam.

Tanto os limites como as linhas de interrupção são definidos como uma série de linhas que conectam pontos do banco de dados.

Efeito do Processamento de Linhas de Interrupção e Limites

Limites e linhas de interrupção fazem com que os triângulos no modelo tomem nova forma. As seguintes figuras demonstram como o software DTMLink renova o modelo através da criação de pontos de interrupção e da formação de triângulos de superfície.

NOTA: Através dessa seção, os limites e linhas de interrupção são mostradas entre pontos de superfície A e B. Os vértices de triângulo são numerados onde apropriado.

Exemplo 1: Linha de Interrupção Cortando um Triângulo

Desenho 1 representa um modelo simplificado e não típico de um triângulo e uma linha de interrupção. Os pontos de interrupção X e Y são formados na intersecção do triângulo e a linha de interrupção.

Desenho 1 Linha de Interrupção Simplificada

As alturas para os pontos X e Y são interpolados ao longo da linha de interrupção entre os pontos A e B. Esse pontos de interrupção tornam-se então pontos de superfície no modelo e três novos triângulos são formados.

Exemplo 2: Linha de Interrupção Cortando Vários Triângulos

O Desenho 2 mostra a representação de um modelo de triângulo com uma linha de interrupção definida.

Desenho 2 Computação (1)

A reformação de triângulos segue seqüencialmente o caminho da linha de interrupção, com a inserção de um ponto de interrupção inserido na interseção de cada lado do triângulo com a linha de interrupção. Estes pontos de interrupção são mostrados. As alturas de cada ponto de interrupção são interpoladas ao longo da linha de interrupção entre os ponto A e B.

Estes pontos de interrupção tornam-se então parte do modelo da superfície e são formados 10 novos triângulos. Veja o Desenho 3. O ponto sólido mostra os novos triângulos que estão sendo criados.

Desenho 3 Computação (2)

Exemplo 3: Limite Cruzando um Triângulo

Desenho 4 representa um modelo simplificado e não típico de um triângulo e um limite. Pontos de interrupção X e Y são formados na interseção  do triângulo com a linha de interrupção. Considera-se que o vértice do triângulo (com a etiqueta 1) está dentro do limite e os vértices  (com etiqueta 2 e 3) fora do limite.

Desenho 4 Limite (1)

A altura para o ponto X é interpolada entre os pontos 1 e 3 . A altura para o ponto Y é interpolada entre os pontos 1 e 2. O triângulo é formado entre X, Y e Z e os pontos X, Y e Z e os pontos 2 e 3 são descartados do modelo da superfície.

O desenho 5 mostra uma situação parecida, onde um limite passa através de um triângulo formado. Novamente, considera-se que o ponto 1 está dentro do limite.

A altura para o ponto X é interpolada entre os pontos 1 e 3. A altura para o ponto Y é interpolada entre os pontos 1 e 2.

Desenho 5 Limite (2)

Dois novos triângulos são formados e pontos 2 e 3 são descartados da superfície e novos triângulos são formados.

Exemplo 4: Limite e Linha de Interrupção Cortando um Triângulo

Uma linha pode ser caracterizada tanto por um limite como por uma linha de interrupção. Ver Desenho 6.

Desenho 6 Limite e linha de interrupção

Pontos de interrupção são criados nos pontos X e Y na interseção do triângulo e linha de interrupção.

Como  a linha A B é uma linha de interrupção e limite, as alturas dos pontos de interrupção X e Y são interpoladas ao longo da linha de interrupção entre os pontos A e B.

Considerando que o vértice 1 está dentro do limite, cria-se o triângulo definido pelos pontos 1, X e  Y. Os pontos 2 e 3 são descartados do modelo.


Apagar todas Linhas
Desenho / Apagar todas Linhas

Use este comando para apagar todas as linhas de interrupção ou limites da superfície.

Aparece uma mensagem de aviso.

Esta operação não pode ser desfeita. Clique OK para remover todas as linhas de interrupção e limites desta superfície.

Clique OK se você tiver certeza de que deseja apagar todas as linhas de interrupção e limites, permanentemente.

A superfície é atualizada quando você clique OK.


Adicionando uma Linha de Interrupção com o Uso da Ferramenta Adicionar Linha de Interrupção

Para adicionar uma linha de interrupção com o uso da Ferramenta Adicionar Linha de Interrupção:

1.	Clique a ferramenta Adicionar Linha de Interrupção [image] da barra de ferramenta Superfície.

O cursor muda para [image] quando a ação está ativada.

2.	Clique o ponto da superfície no início da linha de interrupção.

3.	Continue adicionando seções da linha de interrupção, selecionando pontos da superfície.

Uma linha vermelha é desenhada na tela entre os pontos de superfície selecionados.

Uma vez que as linhas sejam adicionadas, o Indicador de atualização na barra de Estado muda para mostrar que a superfície necessita de atualização.

4.	Para atualizar a superfície, faça um dentre os seguintes:

•	Aperte F4.

•	Use o comando Desenhar / Atualizar superfície.

5.	Para deixar de fazer adições à linha de interrupção, selecione outra ferramenta ou aperte F2.

Para adicionar outra linha de interrupção:

•	Clique novamente na ferramenta Adicionar Linha de Interrupção e repita os passos de 1 a 5, acima.

SUGESTÃO: Adicione uma linha de interrupção e um limite usando o seguinte:

•	Ferramenta Incluir Limite

•	Ferramenta Excluir Limite

Selecione limite e linha de interrupção do menu de cascata.


Menu Desenho

Use o menu Desenho para editar uma superfície. Ele possui os seguintes comandos:

Incluir Ponto

Excluir Ponto

Permutar Triângulos

Apagar Triângulo

Adicionar Linha

Atualizar Superfície

Apagar Linha

Apagar Todas Linhas


Suporte Técnico

Se você tiver algum problema e não puder encontrar as informações necessárias na  documentação do produto, entre em contato com o revendedor da sua região.

Alternativamente, procure suporte técnico usando o site de Internet da Trimble (http://www.trimble.com/support.html/


Marcas Registradas

O logo da Trimble com a Trimble é uma marca registrada da Trimble Navigation Limited, registradas no Departamento de Marcas Registradas e Patentes dos Estados Unidos.

DTMLink, RoadLink, Trimble Geomatics Office, e Survey Controller da Trimble são marcas registradas da Trimble Navigation Limited.

Todas as outras marcas são propriedades dos seus respectivos proprietários.


Garantia

Renúncia de Garantia

Exceto no que vem indicado na “garantia limitada” aqui especificada, o hardware, software e firmware e a documentação da Trimble são fornecidos “como são” e sem garantias expressa ou implicada de qualquer tipo seja pela Trimble Navigation Limited ou qualquer pessoa que esteve envolvido na sua criação, produção, instalação ou distribuição incluindo mas não limitado às garantias implicadas de comércio e aptidão para um determinado fim. O risco total, quanto à qualidade e desempenho do Hardware, software, firmware e documentação da Trimble é seu. Alguns estados não permitem a exclusão de garantias implicadas e, neste caso, a exclusão pode não aplicar-se à você.

Limitação de Responsabilidade

Em nenhum caso a Trimble Navigation Limited ou qualquer pessoa envolvida na criação, produção, instalação ou distribuição do software da Trimble será responsável por suas reivindicações em caso de danos, incluindo qualquer perda de lucro, perda de poupanças ou outros danos especiais, circunstanciais, conseqüências ou exemplares, incluindo, mas não limitados a, qualquer dano atribuído a você ou pago por você a terceiro, surgindo do uso, responsabilidade do uso, qualidade ou funcionamento de tais software e documentação da Trimble, mesmo que a Trimble Navigation Limited ou qualquer dentre estas pessoas ou entidade tenham sido avisadas sobre a possibilidade de danos, ou por reivindicação de outra parte. Alguns estados não permitem a limitação ou exclusão de responsabilidade por danos acidentais ou conseqüentes e, se for assim, as limitações acima não aplicam-se a você

Garantia Limitada do Software e Firmware

A Trimble Navigation Limited garante que os produtos de software e firmware substancialmente corresponderão às especificações publicadas desde que sejam usados com os produtos da Trimble, produtos de computador e sistemas operacionais para os quais foram projetados. Por um período de noventa (90) dias, começando trinta (30) dias depois do despacho da Trimble, a Trimble também garante que o meio de armazenamento nos quais o software e firmware estão distribuídos e a documentação não possuem falhas materiais ou de manufatura. Tal garantia não será aplicada se seus dados pessoais contiverem erros ou foram instalados de maneira errada ou inadequada. Durante o período de garantia de noventa (90) dias a Trimble reporá meios ou documentações defeituosos ou corrigirá erros de programa substanciais gratuitamente. Se a Trimble não puder repor meios ou documentação defeituosos ou corrigir erros de programa substanciais, a Trimble reembolsará o preço pago pelo software. Estes são os seus únicos recursos para qualquer quebra de garantia


Site WWW

Para uma olhada interativa da Trimble, visite o nosso site na WWW
www.trimble.com/


Comentários

Muito obrigado por ter comprado este produto. Nós agradeceríamos os seus comentários sobre ele. Envie suas sugestões para:

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642
Sunnyvale, CA 94086-3642
E.U.A.

Telefone: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
http://www.trimble.com/

Se você tiver qualquer comentário sobre esta documentação, entre em contato conosco. Os seus comentários nos ajudarão a melhorar revisões futuras. Contribuintes com avaliações particularmente úteis receberão um presente de agradecimento.

Envie comentários e sugestões para o endereço acima ou mande-os através de um e.mail para ReaderFeedback@trimble.com

Todos os comentários e sugestões tornam-se propriedades da Trimble Navigation Limited.