Copyright: ©1999-2002 Trimble Navigation Limited. All rights reserved.
Citation: ©1999-2002 Trimble Navigation Limited. All rights reserved.


Trimble Geomatics Office - Noções Gerais

O Trimble Geomatics Office integra a funcionalidade oferecida tanto no Trimble Survey Office como no software GPSurvey. Esta integração de múltiplos pacotes de software da Trimble eleva a interoperabilidade e aumenta a facilidade de uso de uma série de tarefas relacionadas ao levantamento. Extensivas ferramentas de controle de qualidade lhe permitem executar tarefas com mais rapidez e mais eficiência numa transferência de dados sem interrupção do campo para o escritório e de volta ao campo.

Use o Trimble Geomatics Office para:

  Processar linhas de base GPS (se possuir o módulo de Processamento de Linha de Base WAVE instalado)

  Ajuste da rede de levantamento (se possuir instalado o módulo de Ajuste da Rede)

  Processar dados de levantamento topográficos e convencionais

  Garantia de qualidade e controle de qualidade de dados (QA/QC)

  Importar e exportar dados de desenho de estadas

  Importar e exportar dados de levantamento

  Modelo e contorno digitial do terreno

  Transformação e projeções do datum

  Coleta de dados GIS e exportação de dados

  Codificação de característica

  Criação de relatórios de projeto

  Gerenciamento de projeto do levantamento

Características mais importantes

O que segue são as características mais importantes do software Trimble Geomatics Office (versão 1.6):

  Apresentações de visualização de levantamento e plano dos dados do projeto na janela de gráficos

  Barra do projeto organiza tarefas executadas com freqüência como atalhos na janela principal de gráficos

  Filtros de Visualização permitem tipos de observação serem apresentados ou ocultos

  A funcionalidade ‘Arrastar e largar’ lhe permite arrastar e largar qualquer arquivo do trabalho da área de trabalho para a área do projeto

  Importação de dados coletaos de receptores GPS e/ou estações totais convencionais

  Extensivos formatos de importação e exportação

  O diálogo DAT Checkin permite a verificação e edição de dados GPS não processados antes da importação

  A janela Propriedades lhe permite visualizar e editar todas as informações relacionadas para pontos, como também todos os tipos de observação

  O diálogo Edição Múltipla para uma edição rápida de múltiplas entidades

  Suporte para a coleta de dados GIS

  Suporte de camadas para gestão de dados CAD

  Relatórios HTML apresentados de modo profissional

  Formatos de relatório padrão e personalizado

  Módulos RoadLink e DTMLink para a visualização e edição de arquivos de desenho de estrada de companhias terceiras e criação de modelos digitais de terreno.

NOTA: O Trimble Geomatics Office não suporta os sistemas de nome de arquivo 8.3.

Módulos

O seguinte descreve os módulos opcionais que estão disponíveis para o Trimble Geomatics Office:

  O módulo de processamento de linhas de base WAVE computa linhas de base a partir de observações GPS de campo feitas com o uso de procedimentos de coleta da dados estático, FastStatic ou cinemático. O Processador de Linhas de Base WAVE fornece processamento de linha de base e controles flexíveis para processamento avançado. O Timeline apresenta dados GPS encontrados em arquivos de observação não processados em um formato gráfico, baseado no tempo. Para ser usado para visualizar e editar informações de medições e levantamento GPS não processadas.

  O módulo de ajuste da rede ajusta os dados de levantamento GPS para estimar e reduzir os erros inerentes.

O que é “Geomatics”?

Geomatics é o desenho, coleta, armazenamento, análise, apresentação e recuperação de informações espaciais. A coleta de informações espaciais pode ser de uma série de fontes, incluindo os métodos terrestres e de GPS. Geomatics integra o levantamento tradicional com métodos novos ditados pela tecnologia, tornando a geomatics útil para uma série de aplicações.


Remoção do Software

CUIDADO: O processo ilustrado neste tópico remove todos os arquivos, exceto arquivos comuns, gabaritos e arquivos de dados. Para apagar arquivos de dados, use o Microsoft Windows Explorer.

Para remover o Trimble Geomatics Office do seu computador:

1.	Selecione Iniciar / Configurações / Painel de controle.

2.	A partir do Painel de controle, escolha Adicionar ou remover programas.

Aparece o diálogo Adicionar ou remover programas.

3.	Tenha certeza de que a etiqueta Instalar/desinstalar está ativa.

4.	Selecione Trimble Geomatics Office.

5.	Clique Adicionar ou remover.

Aparece a mensagem Confirmar exclusão de arquivo.

6.	Clique Sim.

Os arquivos serão apagados.

CUIDADO: Se você desinstalar o Trimble Geomatics Office todos os formatos personalizados serão perdidos. Por exemplo, se tiverem sido adicionados tipos de símbolos à biblioteca de Símbolos criada pelo sistema (Symbols.sym) ou formatos de importação e exportação personalizados foram adicionados, eles serão todos perdidos.

Os seguintes arquivos armazenam informações personalizadas:

  Arquivos de definição do formulário do plano (*.frm) — personalizados através da edição deste arquivo com um editor de textos

  Arquivos de formato de relatório (Asciirpt.dat) — personalizados quando se criam arquivos personalizados

  Arquivos de definição de importação ASCII (Asciiimp.dat) — personalizados quando se criam formatos de importação personalizados

  Arquivos de definição de exportação de ASCII (Asciiexp.dat) — personalizados quando se criam formatos de exportação personalizados

  Biblioteca de Símbolos criada pelo sistema (Symbols.sym) — personalizada quando se salvam novos tipos de símbolo neste arquivo

  Biblioteca de Tipos de Linha criada pelo sistema (Linetype.ltp) — personalizada quando se salvam novos tipos de linha para este arquivo


Estrutura da Pasta

Durante a instalação, todos arquivos requeridos pelo Trimble Geomatics Office são copiados em pastas listadas abaixo:

Pasta	O que ela armazena
\Arquivos do progroma\Trimble\ Trimble Geomatics Office	Arquivos de Ajuda e do Programa do Trimble Geomatics Office
...\Sistema	Arquivos do sistema; incluindo os arquivos do software da biblioteca de atributos e característica, utilidades Symbol Editor™ e Line Type Editor™, e modelos do relatório HTML
...\Modelo	Arquivos de modelo do projeto
...\Utilidade	Conexões às utilidades A1 Viewer, Convert to RINEX™, Coordinate System Manager™, Data Transfer, DC File Editor™, Feature and Attribute Editor™, Line Type Editor, QuickPlan™ e Symbol Editor
...\RoadLink - DTMLink	Arquivos do programa e arquivos associados para o RoadLink e DTMLink
\Arquivos do programa\Arquivos comuns\ Trimble	Arquivos usados tanto pelo Trimble Geomatics Office como por outros produtos da Trimble.
...\GeoData	Informações do sistema de coordenadas e arquivos do Geóide
...\GeoDB	Arquivos do programa Coordinate System Manager
...\Data Transfer	Arquivos do programa Data Transfer
...\DatToRinex	Arquivos do programa Convert to RINEX
...\Dceditor	Arquivos do programa DC File Editor
...\Plan	Arquivos do programa Planning


Sobre a Trimble

A Trimble é uma líder na inovação da tecnologia do Sistema de Posicionamento Global (GPS). Além de fornecer componentes GPS avançados, a Trimble aumenta a interação de GPS com outras tecnologias de posicionamento, como também comunicações de rádio e software para criar soluções completas para o cliente. As aplicações emergentes da Trimble incluem levantamento, navegação por automóvel, guia para máquinas, rastreamento de bens, plataformas controladas por rádio e infra estrutura para telecomunicações.

Os escritórios corporativos da Trimble estão localizados no 645 N. Mary Avenue, Sunnyvale, CA, Estados Unidos. Nós também temos filiais localizadas em todos o mundo para servi-lo.

Para uma visita interativa da Trimble, visite o nosso site da Internet em:

www.trimble.com


Comando Inverso

Use este comando para determinar o inverso entre dois ponto de projetos.

Para acessá-lo, selecione Levantamento / Inverso.

Aparece o diálogo Inverso.


Diálogo Inverso

Use este diálogo para determinar o inverso entre dois pontos do projeto. Pode-se usar o diálogo para visualizar informações breves ou detalhadas no seu inverso e para criar um relatório.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Levantamento / Inverso.

  Pressione F7.

NOTA: A ferramenta inverso somente funciona com pontos existentes. Para visualizar azimutes e distâncias entre qualquer outra posição de coordenadas, use a ferramenta Medir. Para acessá-la, selecione Levantamento / Medir.

De

Insira um nome de ponto através do teclado ou use preenchimento de ponto para clicar um ponto.

Para

Insira um nome de ponto a partir do teclado ou use o preenchimento de campo para clicar um ponto.

Quando se move o apontador mais próximo para outro ponto, aparece uma linha pontilhada. Ela mostra o inverso a ser computado. Ao clicar no segundo ponto, a linha pontilhada muda para uma linha sólida. Isso mostra a linha à qual os detalhes inversos refere-se.

Se a configuração de Apresentar na guia Unidades e Formatos do diálogo Propriedades do projeto estiver programada para distância do nível do mar ou do grid, e os dois pontos não possuem elevações, aparece a distância e azimute. No entanto, se o campo Apresentar distância como for configurada para distâncias do Solo e ambos pontos inversos possuirem elevações nulas, a apresentação aparece como nulo (se a elevação padrão foi configurada para nulo). Sem qualquer informação sobre a elevação, é impossível computar a distância de solo.

Azimute do Grid

Este campo mostra o azimute do grid entre os pontos.

Distância do Grid

Este campo mostra a distância do grid entre os pontos.

Elevação do Delta

Quando ambos pontos possuem elevações, aparece a elevação delta. Se nenhuma das elevações for conhecida, o campo aparece como nulo.

Método

Dois métodos de cálculos do inverso são disponíveis:

Seqüencial	Para computar um seqüência de inversos um depois após outro.

Radial	Para computar uma seqüência de inversos que partem de um ponto comum de início.

Calcular

Clique Calcular para computar o inverso se você usou o teclado para inserir os pontos selecionados.

Enviar para relatório

Clique Enviar para relatório para criar um relatório da computação inversa. Um relatório breve ou detalhado do inverso pode ser gerado, dependendo da opção da apresentação usada para o inverso.

NOTA: Se o relatório foi gerado de uma opção de apresentação e depois voltar a ser gerado em outro modo de apresentação, os detalhes inversos do relatório são anexados ao relatório existente.

Mostrar relatório

Clique Mostrar relatório para visualizar o Relatório inverso.

O relatório breve mostra os detalhes inversos como apresentado do diálogo Inverso no modo breve.

O relatório detalhado mostra as posições dos pontos “de” e “para” pontos nos sistemas de coordenadas do grid, local (geodésico), e cartesiano (WGS-84), como também os valores inversos calculados e os parâmetros usados para reduzir o inverso naqueles sistemas de coordenadas.

Detalhado / Breve

Clique Detalhado para apresentar o grupo Detalhes. Quando o grupo Detalhes é apresentado, o botão muda para Breve. Clique Breve para ocultar o grupo de Detalhes.

Detalhes

O grupo Detalhes mostra mais informações no inverso.

Azimute p frente SN

Este campo mostra o azimute (geodésico) para frente da seção a partir do primeiro ponto para o segundo ponto.

Azimute p trás SN

Este campo mostra o azimute (geodésico) para trás da seção normal do segundo ponto para o primeiro ponto.

Distância do elipsóide

Este campo mostra a distância do elipsóide entre os pontos.

Distância no solo

Este campo mostra a distância do solo entre os pontos.

Altura do delta

Este campo mostra a altura do delta entre os pontos.


Comando Medir

Use este comando para medir azimutes, distâncias e áreas de qualquer janela de gráficos.

Para acessá-lo, selecione Levantamento / Medir.

Aparece o diálogo Medir.


Diálogo Medir

Use este diálogo para medir azimutes, distâncias e áreas de qualquer janela de gráficos.

Para acessá-la, selecione Levantamento / Medir.

Pode-se medir entre pontos ou posições do projeto na tela (clique na posição apropriada).

Uma vez que tenha selecionado duas ou mais posições, a distância cumulativa entre a primeira e última posições aparece no campo Distância. O campo Azimute mostra o azimute entre as duas posições selecionadas.

SUGESTÃO: Clicando e arrastando com o mouse, os campos mostram o azimute atual, a distância cumulativa a partir do primeiro ponto selecionado e a área encerrada.

Azimute

Ao selecionar duas posições, o grid do azimute entre os pontos é mostrada. Com três ou mais pontos selecionados, este campo mostra o azimute entre os últimos dois pontos.

Distância

Ao selecionar duas posições, aparece a distância entre os dois pontos. Ao selecionar duas posições, a distância entre os dois pontos é mostrada. Com três ou mais pontos selecionados, este campo mostra o total cumulativo (soma) das distâncias medidas.

Distâncias totais são especificadas de acordo com as configurações da apresentação.

NOTA: Se o campo Apresentar distância como Apresentar distância como no diálogo Propriedades do projeto é configurado para Distâncias no solo e ambas posições medidas possuir elevações nulas, a distância é apresentada como nula (se a elevação padrão estiver configurada para nulo). Sem nenhuma informação sobre a elevação, o software não pode computar a distância do solo.

Área

Com três ou mais pontos selecionados, aparece a área da figura formada através do encerramento com o primeiro ponto. fechamento.

A área computada varia dependendo das configurações da apresentação da distância:

  Uma configuração da distância do solo fornece uma área computada na elevação média do solo.

  Uma configuração da distância do nível do mar fornece uma área computada na superfície do elipsóide.

  Uma configuração da distância do grid fornece uma área computada a partir das coordenadas do grid.

Reajustar

Clique Reajustar para limpar todos os campos. Também pode-se reconfigurar clicando duas vezes no ponto de início.

SUGESTÃO: Pode-se determinar rapidamente quanto o projeto deverá ser exibido na janela de gráficos através da visualização do indicador de dimensões da janela [image] da barra de status. Para visualizar este indicador, mantenha o cursor fora da janela de gráficos.

Quando estiver usando o apontador [image] pressione Ctrl. Isso evite saltos para um ponto próximo.


Transformação de Coordenadas - Perspectiva geral

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Uma transformação de coordenadas muda os pontos no projeto. Ela pode envolver mudanças, rotações e escala em duas dimensões. Pontos com uma qualidade de Controle ou Ajustado não são movidos. Se o ponto selecionado para mover possuir uma qualidade de ajustado ou de controle, aparece uma mensagem.

Usa-se uma transformação de coordenada quando, por exemplo, se aparecerem no projeto pontos de pacotes de desenho terceiros que estejam num sistema de coordenadas adotado e quando requer-se transformar os pontos para obter coordenadas corretas para usar.

Para definir as transformação de coordenadas, pode-se fazer um dentre os seguintes:

  Usando o preenchimento de campo, clique em pontos e insira então os seus valores de coordenadas conhecidos. Se mais de três pontos estiverem sendo usados, o software usa o método dos quadrados mínimos para calcular os parâmetros de transformação para os pontos selecionados.

  Especifique os parâmetros de transformação.

Ao efetuar uma transformação de coordenadas, todas as outras observações ao ponto são desabilitadas. As coordenadas do Grid, Local e WGS-84 para os pontos transformados são mudadas, mas o sistema de coordenadas não é.

Uma vez que se tenha efetuado uma transformação, pode-se criar um relatório que mostre os valores de coordenada original e transformado.


Comando Transformação de Coordenadas

Use este comando para determinar e aplicar uma transformação horizontal.

Para acessá-lo, selecione Levantamento / Transformação de Coordenadas.

Aparece o diálogo Transformação de Coordenadas.


Diálogo Transformação de Coordenadas

 Perspectiva geral e Outras Informações

Use este diálogo para determinar e aplicar um transformação horizontal.

Para acessá-lo, selecione Levantamento / Transformação de Coordenadas.

Para inserir valores neste diálogo, faça um dentre os seguintes:

  Clique Lista de Ponto para selecionar pontos no projeto para os quais existam coordenadas conhecidas e insira os valores conhecidos para casa ponto. O software calcula os parâmetros da transformação. Se existirem mais de três valores de ponto, ele utiliza o método de quadrados mínimos. As estatísticas são mostradas na lista de Pontos para auxiliá-lo avaliar se os pontos foram adicionados corretamente na lista. O diálogo Transformação de Coordenadas mostra os valores da transformação.

  Insira os valores a partir do teclado.

Ao efetuar uma transformação de coordenada, todas as outras observações do ponto são desativadas. As coordenadas Grid, Local e WGS-84 apresentadas para os pontos transformados são mudadas. O sistema de coordenadas não muda.

Translação leste

Mostra a quantidade de translação para o leste (positiva) ou oeste (negativa).

Translação norte

Mostra a quantidade de translação para o norte (positiva) ou sul (negativa).

Rotação

Mostra a quantidade de rotação angular a ser aplicada na transformação.

Escala

Mostra a mudança de escala da transformação.

Origem da rotação

Os seguintes campos mostram a posição do centro da rotação.

Ponto	Mostra o nome do ponto que deve ser usado como o ponto de origem da rotação. Se um nome de ponto for inserido, as coordenadas são apresentadas nos campos Norte e Leste. Se for utilizada a Lista de Ponto para computar os parâmetros, este campo mostra o primeiro ponto de controle selecionado.
Norte	Mostra a coordenada Norte do ponto de origem.
Leste	Mostra a coordenada Leste do ponto de origem.

Transformar

Para transformar os pontos, selecione uma das seguintes opções:

Seleção	Aplica a transformação aos pontos selecionados.
Todo o banco de dados	Aplica a transformação a todos os pontos do projeto.
Quando nenhum ponto é selecionado, estas opções não são disponíveis e todos os pontos são transformados.

Gerar o relatório de transformação da coordenada

Selecione este quadro de verificação para criar um relatório das coordenadas original e transformada. O relatório aparece no visualizador padrão HTML.

Lista de Ponto

Clique na Lista de Ponto selecionar os pontos de controle. Insira os valores conhecidos para os pontos.

Aparece o diálogo Lista de Pontos.


Transformação de Coordenadas - diálogo Lista de Ponto

 Perspectiva geral e Outras Informações

Use o diálogo Transformação de Coordenadas – Lista de ponto para selecionar pontos que são usados para calcular os parâmetros da transformação de coordenadas. Você seleciona os pontos, o Trimble Geomatics Office apresenta as coordenadas atuais e você insere então as coordenadas conhecidas. O Trimble Geomatics Office calcula os parâmetros de transformação e aplica a transformação aos pontos selecionados para transformar.

Para acessá-lo:

1.	Selecione Levantamento / Transformação de Coordenadas. Aparece o diálogo Transformação de Coordenadas.

2.	Clique Lista de Ponto.

Este diálogo apresenta uma lista rolante de pontos. Cada ponto possui campos que mostram as coordenadas atuais e campos que mostram as coordenadas conhecidas. Insere-se o nome do ponto e aparece o campo Norte atual e Leste atual. Então insere-se as coordenadas conhecidas nos campos Norte conhecido e Leste conhecido.

SUGESTÃO: Pode-se deixar em branco o nome do ponto e usar preenchimento de campo para inserir as coordenadas atuais.

Não há limite para o número de definições de posição que podem ser definidos para computar uma transformação de coordenadas. A adição de muitas definições de posições nem sempre melhora os resultados computados da transformação, mas fornece verificações extras sobre a validade de parâmetros computados.

Estatísticas

O grupo Estatísticas exibe o fator escala e o resíduo máximo horizontal. Use estas estatísticas para verificar se algum valor foi inserido.

Inserir

Clique Inserir para inserir um registro de definição de posição vazio. Geralmente, o Trimble Geomatics Office adiciona automaticamente novos campos de definição da posição, portanto não há necessidade de fazer isso com freqüência. No entanto, como o primeiro ponto da Lista de Ponto é utilizado como a origem da rotação nos parâmetros de transformação computados, talvez você queira inserir uma definição de posição no início da lista.

Apagar

Clique Apagar para remover uma definição de posição da lista.


Ajuste de Elevação - Perspectiva geral

Outras Informações

Como ...	Diálogo	Ver também

Um ajuste de elevação ajusta elevações do ponto.

Uma vez que o ajuste é efetuado, o Trimble Geomatics Office aplica o ajuste de elevação usando um dos seguintes métodos:

  Onde forem inseridas elevações conhecidas para pontos existentes, o Trimble Geomatics Office calcula os parâmetros de ajuste da elevação.

  Onde for inserida uma constante (positiva ou negativa), o Trimble Geomatics Office aplica-a a todos pontos selecionados.

NOTA: O ajuste da elevação não será aplicado se a altura do ponto ou qualidades da elevação são controle ou ajustadas.

Resultados do Ajuste de Elevação

Ao efetuar um ajuste de elevação, todas as outras observações de posições de ponto ou grid de um ponto são desabilitadas. As coordenadas de Grid, Local ou WGS-84 apresentadas para os pontos transformados são mudadas. O sistema de coordenadas não muda.

A seguinte tabela mostra os parâmetros calculados quando uma série de elevações são incluídas na lista de pontos.

NOTA: O ajuste de elevação computado não é incluído na definição do sistema de coordenadas, contrário do ajuste vertical, que pode ser efetuado for a do comando Levantamento / Calibração do Local GPS.

Pode-se criar um relatório que mostre a elevação original, elevação ajustada e a diferença entre as duas.


Comando Ajuste de Elevação

Use este comando para determinar e aplicar um ajuste da elevação.

Para acessá-lo, selecione Levantamento / Ajuste da Elevação.

Aparece o diálogo Ajuste de Elevação.


Diálogo Ajuste de Elevação

 Perspectiva geral e Outras Informações

Use este diálogo para determinar e aplicar um ajuste de elevação.

Para acessá-lo:

•	Selecione Levantamento / Ajuste da Elevação.

Para ajustar elevações de pontos selecionados do projeto, use um dos seguintes métodos:

  Método constante

  Método de parâmetros planos (insira os valores ou selecione os pontos)

Constante

Selecione esta opção para adicionar um valor constante às elevações do ponto. Aplique a constante a pontos selecionados ou todo o projeto.

Adicionar à elevação

O campo Adicionar à elevação torna-se disponível quando se seleciona a opção constante. Insira um valor de elevação positivo ou negativo para fazer adições a pontos.

Parâmetros

Selecione esta opção para especificar ou calcular os parâmetros para um ajuste de elevação plana inclinada. Para selecionar os pontos de controle para calcular os parâmetros, clique Lista de Ponto.

Ponto de origem

Mostra o nome do ponto a ser utilizado como ponto de origem para o plano inclinado.

NOTA: Se a Lista de Ponto for usada para pontos selecionados para a computação dos parâmetros, este campo mostra o primeiro ponto de controle selecionado.

Leste de origem

Mostra a coordenada Leste do ponto de origem. Se você selecionar um ponto do campo Ponto de origem, este campo será preenchido com a coordenada do ponto selecionado.

Norte de origem

Mostra a coordenada Norte do ponto de origem. Se selecionar um ponto do campo Ponto de origem, este campo é preenchido com a coordenada do ponto selecionado.

Constante correção

Mostra a correção da elevação aplicada na posição de origem.

Declive norte

Este valor define o declive do plano na direção norte-sul. Um ajuste de elevação é calculado a partir deste valor de partes por milhão (ppm) e a distância (direção norte-sul) da origem. Ele é aplicado em adição à constante da correção.

Declive leste

Este valor define o declive do plano na direção leste-oeste. Um ajuste da elevação é calculado a partir deste valor ppm e a distância (leste-oeste) da origem. Ele é aplicado adicionalmente à constante da correção.

Lista de Ponto

Clique Lista de Ponto para selecionar os pontos de controle a serem usados para computar os parâmetros de ajuste da elevação. Aparece o diálogo Lista de Ponto.

Ajuste

Selecione esta opção para aplicar o ajuste. São disponíveis duas opções:

Seleção	Selecione esta opção para aplicar o ajuste para os pontos selecionados.
Todo o banco de dados	Selecione esta opção para aplicar o ajuste para todos os pontos do projeto.
Quando não houver nenhum ponto selecionado, os botões de seleção não são disponíveis e o ajuste é aplicado a todos os pontos do projeto.

Gerar o relatório do ajuste de elevação

Selecione este quadro de verificação para criar um relatório das elevações original e ajustada. O relatório aparece no visualizador HTML padrão.


Ajuste de Elevação - diálogo Lista de Ponto

 Perspectiva geral e Outras Informações

O Trimble Geomatics Office usa os pontos selecionados neste diálogo para calcular os parâmetros de ajuste da elevação. Seleciona-se pontos no projeto e insere-se as elevações conhecidas para eles.

Para acessá-lo:

1.	Selecione Levantamento / Ajuste de Elevação. Aparece o diálogo Ajuste de Elevação.

2.	Clique Lista de Ponto.

Selecione cada ponto de controle, usando o preenchimento de campo ou através da entrada do teclado e insira a elevação conhecida.

SUGESTÃO: Os campos coordenada e elevação podem ser inseridos através do preenchimento de campo para conseguir pontos apropriados da tela.

Geralmente, insere-se três ou mais pontos de controle. Estes pontos devem ser distribuídos igualmente em todo o perímetro dos pontos que estão sendo ajustados.

Não existe um limite específico para o número de pontos que podem ser definidos para computar um ajuste de elevação. A adição de muitas definições de pontos nem sempre melhora os resultados do ajuste computado, mas fornece adicionais verificações dos parâmetros computados.

Estatísticas

O grupo Estatísticas mostram a inclinação máxima do ajuste e o máximo resíduo vertical. Use estas estatísticas para verificar se não foi inserido algum valor incorreto.

Inserir

Clique Inserir para inserir um registro de definição do ponto. Geralmente, o Trimble Geomatics Office adiciona automaticamente novos campos de definição do campo, portanto, não há necessidade de usar este botão muitas vezes. No entanto, como o primeiro ponto da lista de pontos é usado como o ponto de origem do Ajuste de Elevação, pode-se usar esta função para colocar um ponto no início da lista de ponto desejada. No entanto, a posição usada para a origem de ajuste geralmente não é significativa.

Apagar

Clique Apagar para apagar uma definição de ponto da lista.


Comando Desfazer

Use este comando para inverter ações.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Editar / Desfazer.

  Pressione Ctrl+Z.

No menu Editar, o texto que aparece próximo ao comando Desfazer mostra a ação que deve ser desfeita. Ações podem ser desfeitas uma de cada vez. As ações efetuadas mais recentemente são desfeitas antes. De uma ação for desfeita por acidente, use o comando Refazer.

Se você fechar o projeto, ou o Trimble Geomatics Office, você não pode desfazer nenhuma ação que foram efetuadas enquanto ele estava aberto.

SUGESTÃO: Para inverter uma operação de importação após o fechamento do projeto, use a opção Da fonte do diálogo Selecionar pontos / guia Geral e exclua a seleção para desfazer a operação de importação.


Comando Refazer

Use este comando para refazer ações que se desfazem usando o comando Editar / Desfazer.

Para acessá-lo, faça um dentre os seguintes:

  Selecione Editar / Refazer.

  Pressione Ctrl+Y.

No menu Editar, o texto que aparece próximo ao comando Refazer mostra a ação a ser refeita.

Ações podem ser refeitas uma de cada vez.

Se um projeto for escolhido, não pode-se refazer nenhuma das ações efetuadas enquanto ele estava aberto.


Comandos Cortar / Copiar / Colar

Os comandos Cortar, Copiar e Colar representam um modo conveniente de mover ou copiar a seleção atual de dados.

A partir do menu Editar, selecione Cortar, Copiar ou Colar:

  Cortar remove a seleção do projeto atual.

  Copiar faz uma duplicata da seleção.

  Colar insere a seleção em outro projeto ou aplicação do software.

Quando se corta e copia uma seleção, ele é mantida na área de transferência. Cada novo corte ou cópia substituem a seleção anterior.

A cópia da seleção permanece na área de transferência após a seleção tenha sido colada num projeto ou aplicação de software. Pode-se colar a seleção novamente ou quantas vezes forem elas necessárias.

Use estes comandos para:

  transferir dados entre os seus projetos (por exemplo, pode-se copiar os pontos de controle entre projetos)

  copiar e colar pontos com atributos de um projeto para outro

  copiar e colar o trabalho CAD num relatório

  copiar dados num projeto com um diferente sistema de coordenadas (por exemplo, pontos de um projeto com um sistema de coordenadas NAD-27 podem ser copiados e colados num projeto com um sistema de coordenadas NAD-83)

As entidades copiadas são coladas num projeto através do uso dos valores de coordenadas com eles. Isso faz com que as entidades sejam posicionadas corretamente porque se o projeto no qual se está colando entidades possui uma definição diferente do sistema de coordenadas para o projeto fonte para as entidades, os valores de coordenadas são convertidos automaticamente para o novo sistema de coordenadas.

NOTA: Para copiar e colar observações de um projeto para outro, deve-se usar o formato Trimble Data Exchange. Observações não podem ser copiadas e coladas entre projetos no Trimble Geomatics Office.


Comando Apagar

Use este comando para apagar as entidades atualmente selecionadas.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Editar / Apagar.

  Pressione Apagar.

Para desfazer um comando de Apagar:

  Selecione Editar / Desfazer.


 Comando Renomear pontos

Use este comando para renomear pontos.

Para acessá-lo, selecione Editar / Renomear pontos.

Aparece o diálogo Renomear.


Diálogo Renomear

 Perspectiva geral e Outras Informações

Se houverem muitos pontos num projeto, que não estejam num mesmo ponto físico mas que tenham o mesmo nome, pode-se resolver o problema de pontos duplicados renomeando-os com o uso do diálogo Renomear.

Exemplo

Importam-se dois arquivos do Survey Controller coletados por diferentes pessoas que coletavam no campo:

  Uma pessoa que coleta no campo usa nomes de ponto de 1000 à 2000.

  A outra pessoa que coleta no campo usa nomes de ponto de 1000 à 1050.

Quando os arquivos são importados enquanto a opção Juntar pontos duplicados dentro da tolerância, 51 pontos duplicados (de 1000 à 1050) são criados no banco de dados.

Quando os arquivos são importados enquanto a opção Sempre juntar pontos duplicados estiver no diálogo Opções de ponto duplicado, o software lhe diz quais foram os pontos duplicados que uniu. Se desejar renomear os pontos duplicados, desfaça a opção de importação e volte a renomeá-las.

Para fazê-lo:

  Selecione Editar / Renomear pontos. Aparece o diálogo Renomear.

Renomear

Para renomear os pontos, selecione uma das seguintes opções:

Seleção – Esta opção renomea os pontos selecionados.

Todos o banco de dados – Esta opção renomeia todos os pontos.

Quando nenhum ponto é selecionado, por padrão, todos os pontos do banco de dados são renomeados.

Sugestão: Para renomear coordenadas desde um arquivo .dc, use o diálogo Selecionar pontos para selecionar pontos da fonte.

Método

O grupo Método possui as seguintes opções:

Renomear de

Clique Renomear de e insira o primeiro dos nomes que deseja substituir.

Nota: Se um nome alfabético for inserido, todos os pontos da seleção receberão o mesmo nome. Insira um valor numérico para o último caractere do nome para aumentar os nomes de ponto quando a seleção é efetuada.

Adicionar prefixo

Clique Adicionar prefixo e insira um prefixo. Por exemplo, para indicar pontos Topo, insira o prefixo TOPO para o nome de ponto existente selecionado.

SUGESTÃO: Faça com que o último caractere do prefixo seja um espaço. Isso distingue o ponto renomeado do original.

Adicionar sufixo

Clique Adicionar sufixo e insira um sufixo. Por exemplo, adicione um sufixo de data a pontos para indicar a data do levantamento (tal como, 08/10/99).

SUGESTÃO: Faça com que o primeiro caractere do sufixo seja um espaço. Isso distingue o ponto renomeado do original.

Adicionar Constante

Use esta opção para adicionar uma constante aos pontos selecionados. O valor constante pode ser positivo ou negativo. As seguintes tabelas fornecem alguns exemplos:

NOTA: P1023 - 1000 resulta P23. Se o resultado desejado for P0023, pode-se efetuar uma segunda operação para renomear: P23 + 0000.

Relatório

Selecione este quadro de verificação para criar um relatório dos nomes original e novo. Ao clicar OK, o relatório aparece no visualizador padrão HTML.


Comando Propriedades

Use este comando para abrir a janela Propriedades.

Para acessá-lo, selecione Editar / Propriedades.

A janela Propriedades abre-se.


    Estilos CAD - Perspectiva geral

Outras Informações

Ver também	Diálogo
Perspectiva geral

Na visualização do Plano, estilos CAD especificam como as entidades (pontos, linhas e texto) são apresentados na janela de gráficos do Trimble Geomatics Office.

Estilos de CAD incluem:

  Estilos de ponto

  Estilos de linha

  Estilos de texto

Estilos de ponto e estilos de linha

Estilos de ponto e estilos de linha especificam como os pontos e linhas são apresentados.

Um estilo de ponto é feito de um símbolo de ponto e especificações que configuram o tamanho, cor e dimensões do símbolo. Para criar e editar símbolos de ponto, use a utilidade Editor de Símbolos.

Um estilo de linha é feito de um tipo de linha e especificações que configuram o tamanho, cor e dimensões do tipo. Para criar e editar tipos de linha, use a utilidade Editor de Linhas.

Para configurar os estilos para um ponto ou linha, use um dentre o seguinte:

  A janela Propriedades.

  Processamento do código de característica.

Para criar e editar estilos de ponto, use o diálogo Estilos CAD do Trimble Geomatics Office, ou a utilidade Editor de Características e Atributos.

Os gabaritos padrão da Trimble possuem um estilo ponto e um estilo linha para cada tipo de símbolo e de linha no arquivo Símbolos (*.sym) e no arquivo Tipo de linha (*.ltp). Os estilos possuem o mesmo nome do tipo de símbolo ou linha.

Se um ponto ou linha tiver o seu campo do estilo do ponto ou campo do estilo da linha configurado para <Por Camada>, o estilo do ponto ou estilo da linha designado aos pontos ou linhas são herdados da camada. Os estilos padrão são enviados para a camada na qual os pontos e linhas estão situados.

Para configurar os estilos padrão para diferentes camadas, use o diálogo Camadas.

Estilos de texto

Estilos de texto configuram como as entidades de texto são apresentadas no Trimble Geomatics Office. Use a janela Propriedades para configurar o estilo de texto para as entidades de texto. Um estilo de texto é feito de uma fonte, informações do tamanho e formato da fonte. A Trimble fornece um estilo de texto, chamado Padrão, mas pode-se criar um pessoal. Para fazer isso, use o diálogo Estilos CAD no Trimble Geomatics Office.


    Comando Estilos

Use este comando para criar e administrar estilos de ponto, estilos de linha e estilos de texto.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Editar / Estilos.

  Pressione Ctl+S.

Aparece o diálogo Estilos CAD.


    Diálogo Estilos CAD

 Perspectiva geral e Outras Informações

Use o diálogo Estilos de CAD para criar e administrar estilos de ponto, linha e texto.

Para acessá-lo:

  Selecione Editar / Estilos.

Novo

Abre o diálogo Criar estilos e cria um novo estilo baseado na guia atual.

Editar

Clique Editar para editar um estilo existente. Se você editar um estilo CAD que está sendo usado por uma entidade na projeto, a entidade é atualizada com as novas configurações do estilo CAD.

Apagar

Clique Apagar para apagar um estilo. Pode-se apagar qualquer estilo CAD que não está sendo usado por uma entidade no projeto.


    Diálogo Criar/Editar estilo de ponto

Use este diálogo para criar ou editar um estilo de ponto.

Para acessá-lo:

1.	A partir da visualização do Plano, selecione Editar / Estilos. Aparece o diálogo Estilos CAD.

2.	Na guia Estilos de ponto, escolha uma das seguintes opções:

  Clique Novo. Aparece o diálogo Criar estilo de ponto.

  Clique Editar. Aparece o diálogo Editar estilo de ponto.

Uma vez que tenha selecionado um estilo, o botão Editar torna-se disponível.

Nome

Insira o nome de um novo estilo de ponto ou renomeie um estilo de ponto existente. Todos os nomes de estilo de ponto devem ser originais. No entanto, pode-se usar o mesmo nome para um estilo de ponto, um estilo de linha e um estilo de texto.

Símbolo

Selecione um símbolo da lista de Símbolos. Para visualizar e editar um símbolo, use a utilidade Symbol Editor.

Cor

Selecione uma cor para o símbolo. Se você selecionar texto do Windows, o estilo será apresentado com o uso da configuração de texto do Window do Microsoft Windows. Para editar a configuração do Window, use o Painel de Controle. Se for usado texto da Janela, o padrão do estilo do desenho é preto quando se seleciona o Estilo da legenda padrão. Para selecionar o Estilo da legenda padrão, escolha Visualizar / Opções / guia Inscrição do levantamento. Se você selecionar o Estilo da legenda preto, o padrão do estilo, quando se desenha, será branco.

Algumas definições de símbolo possuem cores definidas. Estas cores são configuradas quando o símbolo é criado na utilidade Trimble Symbol Editor. Por exemplo, quando se usa a utilidade Trimble Symbol Editor, a cor do símbolo ‘bosque’ pode ser definida como verde. Ao selecionar símbolos que possuam definições de cor, o campo Cor não torna-se disponível e o campo Cor apresentará ‘do símbolo’.

Diâmetro

Insira o diâmetro para o símbolo. As unidades para o campo Diâmetro mudam dependendo se a opção Dimensões está configurada para Papel ou Solo. Para alguns símbolos onde o diâmetro não é aplicável (tal como um só ponto pixel), este campo não torna-se disponível.

Papel	Com a opção Papel selecionada, o valor do diâmetro do símbolo controla o tamanho do símbolo no papel.

Por exemplo, se a opção Dimensões estiver configurada para Papel e você inserir 5 no campo Diâmetro, o Trimble Geomatics Office desenha um símbolo de cinco milímetros num desenho métrico.
As unidades que o Trimble Geomatics Office usa são unidades de Coordenadas. Para ajustar as unidades de Coordenadas, selecione Arquivo / Propriedades do projeto / guia Unidades e Formato.

A representação da unidades de papel na tela é calculada com o uso da escala do desenho. Para configurar a escala do desenho, selecione o diálogo Arquivo / Ajuste da Folha.

Solo	Com a opção Solo selecionada, o valor diâmetro do símbolo é o tamanho no solo.

Por exemplo, se a opção Dimensões estiver configurada para Solo e você inserir 5 no campo Diâmetro, o Trimble Geomatics Office fornece um símbolo do tamanho de cinco metros (ou um símbolo do tamanho de cinco pés, dependendo das configurações das Unidades de coordenadas). Este resultado ocorre tanto no desenho como na tela.
Para configurar as unidades da Coordenada, selecione Arquivo / Propriedades do projeto / guia Unidades e Formato.

Rotação

Use o campo Rotação para controlar a orientação do símbolo. A interpretação deste campo depende das configurações da opção Dimensões. A interpretação deste campo depende das configurações da opção Dimensões.

Papel	Com a opção Papel selecionada, o símbolo é sempre desenhado com a sua orientação relativa ao alto da página na qual é desenhado.

Solo	Com a opção Solo selecionada, o símbolo é desenhado com relação ao norte.

Dimensões

Clique Papel ou Solo para controlar a operação dos campos Diâmetro e Rotação como descrito acima.


    Criar / Editar diálogo Estilo de Linha

Use este diálogo para criar ou editar um estilo de linha.

Para acessá-lo:

1.	A partir da Visualização do plano selecione Editar / Estilos. Aparece o diálogo Estilos CAD.

2.	Na guia Estilos de linha, escolha uma das seguintes opções:

  Clique Novo. Aparece o diálogo Criar Estilo de Linha.

  Clique Editar. Aparece o diálogo Editar Estilo de Linha (o botão Editar torna-se disponível uma vez que um estilo seja selecionado).

Nome

Insira o nome de um novo estilo de linha ou renomeie um estilo de linha existente. Todos os nomes de estilo de linha devem ser singulares. No entanto, pode-se usar o mesmo nome para um estilo de linha, um estilo de ponto e um estilo de texto.

Configurações

Use o grupo Ajustes para definir a aparência do estilo.

Tipos de linha

Selecione o tipo de linha para a linha. Para visualizar e editar um tipo de linha, use a utilidade Editor do Tipo de Linha da Trimble.

Cor

Selecione  uma cor para o estilo de linha. Se selecionar texto para texto do Window, o estilo será apresentado com o uso da configuração de texto do Microsoft Windows. Para editar a configuração do texto Window, use o Painel de controle no Microsoft Windows. Se for usado o texto Window, o padrão do estilo será preto quando se desenha, se estiver selecionado o Estilo da Legenda padrão. Para selecionar o Estilo da Legenda padrão, escolha Visualizar / Opções / guia Inscrição do levantamento. Se tiver selecionado o Estilo da legenda, o padrão do estilo será branco quando se desenha.

Algumas definições de tipo de linha possuem cores definidas. Estas cores são configuradas quando o tipo de linha é criado na utilidade Editor de Tipo de Linha da Trimble. Por exemplo, quando se usa a utilidade Editor de Tipo de Linha da Trimble, a cor para as ‘bordas’ do tipo de linha pode ser definido como verde. Quando se seleciona tipos de linhas que possuem definições de cor, o campo Cor torna-se indisponível e o campo Cor apresenta ‘do tipo de linha’.

Comprimento

Insira o comprimento da repetição do modelo. Este campo torna-se disponível se o tipo de linha é um modelo repetido quando o estilo de linha é selecionado para uma linha. Por exemplo, pode-se selecionar uma ‘linha cerca’ como um tipo a ser repetido. A seguinte figura mostra isso:

Alguns tipos de linha possuem um comprimento inerente (por exemplo, portão) e este campo é indisponível.

A interpretação deste campo depende da configuração da opção Dimensões. As unidades para o campo Comprimento mudam, dependendo se a opção Dimensões está configurada para Papel ou Solo.

Papel	Com a opção Papel selecionada, o valor comprimento é configurado para milímetros (mm) ou polegadas (in). As unidades dependerão da configuração da Unidades de coordenadas (para configurar estas unidades, selecione Arquivo / Propriedades do Projeto / guia Unidades e Formato).

Por exemplo, se a opção Dimensões estiver configurada para Papel, o inserimento do número 5 no campo Comprimento desenhará uma linha com o uso de uma repetição do modelo de cinco milímetros (ou cinco polegadas).

A representação das unidades do papel na tela é calculada com o uso da escala do desenho. Para configurar a escala do desenho, selecione Arquivo / File / Ajuste da Folha.

Solo	Com a opção Solo selecionada, o valor do comprimento é o valor do solo configurado para as unidades da Coordenada. Para configurar estas unidades, selecione Arquivo / Propriedades do Projeto / guia Unidades e Formato.

Por exemplo, se a opção Dimensões for configurada para Solo, o inserimento de 5 no campo Comprimento resulta (tanto no desenho como na tela) numa linha que usa uma repetição do modelo de cinco metros (ou cinco polegadas).

Largura

Insira a largura da linha. Para alguns tipos de linha (por exemplo, sólida), a largura não aplicável e o campo torna-se indisponível. A seguinte figura mostra como o campo Largura é aplicado:

A interpretação deste campo depende da configuração das dimensões.

Papel	Se a opção Dimensões for configurada para Papel, o tipo de linha é configurado em milímetros ou polegadas (as unidades dependerão da configuração das Unidades de coordenadas. Para configurar estas unidades, selecione Arquivo / Propriedades do Projeto / guia Unidades e Formato).

Solo	Se a opção Dimensões for configurada para Solo, o valor do tipo de linha será os valores do solo configurado para as unidades da coordenada em Arquivo / Propriedades do Projeto / Unidades e Formato.

Dimensões

Clique Papel ou Solo para controlar a operação dos campos Comprimento e Largura, como descrito acima.


    Diálogo Criar / Editar Estilo de Texto

Use o diálogo Criar / Editar Estilo de texto para criar ou editar um estilo de texto.

Para acessá-lo:

1.	A partir de Visualização do plano, selecione Editar / Estilos. Aparece o diálogo Estilos CAD.

2.	Selecione a guia Estilos de texto.

3.	Escolha uma das seguintes opções:

  Clique Novo. Aparece o diálogo Criar estilo de texto.

  Clique Editar. Aparece Editar estilo de texto.

Uma vez que tenha selecionado um estilo, o botão Editar torna-se disponível.

Nome

Insira o nome de um novo texto ou renomeie o nome atual do estilo de texto. Todos os nomes do estilo de texto devem ser singulares. No entanto, pode-se usar o mesmo nome para um estilo de texto, um estilo de linha e um estilo de ponto.

Fonte

Selecione a fonte para o estilo mais apropriado.

Os nomes de fonte apresentados na lista são as fontes disponíveis no sistema do Microsoft Windows.

Cor

Selecione a cor para o texto. Se não selecionar uma cor, o padrão será a configuração de texto do Window do Microsoft Windows. Para editar as configurações do texto do Window, use o Painel de controle. Se texto Window for usado, o padrão do estilo será preto quando se desenha, se estiver selecionado o Estilo da Legenda padrão. Para selecionar o Estilo da Legenda padrão, selecione Visualização / Opções / guia Inscrição do levantamento. Se estiver selecionado o estilo de legenda preto, o padrão do estilo na tela será branco.

Altura

Insira a altura do estilo de texto.

A interpretação deste campo depende da configuração das dimensões.

Papel	Quando a opção Papel está selecionada, o valor altura é configurado para milímetros (mm) ou polegadas (in). As unidades dependerão da configuração da Unidades de coordenadas em Arquivo / Propriedades do Projeto / guia Unidades e Formato.)

Por exemplo, se a opção estiver configurada para Papel, o inserimento de 5 no campo Altura, cria uma altura de texto de 5 mm num desenho métrico. A representação das unidades do papel na tela é calculada com o uso da escala do desenho especificado de Arquivo / Ajuste da Folha.

Solo	Com a opção Solo selecionada, o valor da altura é os valores do solo configurados para as unidades da coordenada em Arquivo / Propriedades do Projeto / guia Unidades e Formato.

Por exemplo, se a opção for configurada para Solo, o inserimento de 5 no campo Altura mostrará (tanto no desenho como na tela) um texto de cinco metros de altura num desenho métrico.

Estilo da fonte

Marque os quadros negrito, itálico ou sublinhado para criar o efeito de texto desejado.

Dimensões

Clique Papel ou Solo para controlar a operação do campo Altura, como descrito acima.


    Comando Camadas

Use este comando para administrar camadas para o projeto atual.

Para acessá-lo:

•	Selecione Editar / Camadas.

Aparece o diálogo Camadas.


    Diálogo Camadas

 Perspectiva geral e Outras Informações

Use este diálogo para administrar camadas para o projeto atual.

Para acessá-lo, faça um dentre os seguintes:

  Selecione Editar / Camadas.

  Clique a ferramenta Camadas [image].

  Pressione Ctrl+L.

A camada atual é apresentada no alto do diálogo.

Nome

Insira um nome para a camada. O nome deve ser original. Se o nome da camada que contém as entidades for mudado, as entidades são movidas para a nova camada.

Estilo de ponto

Selecione um estilo de ponto da lista. As entradas da lista são os estilos predefinidos da Trimble e estilos de pontos novos criados no Trimble Geomatics Office (com o uso de Editar / Estilos), ou durante o processamento do código de característica (para maiores informações, consulte a Ajuda da utilidade Feature and Attribute Editor).

Este estilo de ponto é aquele usado para todos os pontos nesta camada que possuam selecionado <Por camada> como seus estilos de ponto.

Estilo de Linha

Selecione um estilo de linha da lista. As entradas na lista são os estilos predefinidos da Trimble e novos estilos de linha criados no Trimble Geomatics Office (usando Editar / Estilos) ou durante o processamento do código de característica (para maiores informações, consulte a Ajuda da utilidade Feature and Attribute Editor).

Este estilo de linha é aquele usado para todas as linhas nesta camada que possuam selecionado <Por camada> como seus estilos de linha.

Estilo do texto

Selecione um estilo de texto da lista. As entradas na lista são os estilos predefinidos da Trimble e novos estilos de texto criados no Trimble Geomatics Office (usando Editar / Estilos).

Este estilo de texto é aquele usado para todos os textos nesta camada que possuam selecionado <Por camada> como seus estilos de texto.

Bloqueado

Para permitir que entidades da camada sejam selecionadas na janela de gráficos do Trimble Geomatics Office, desmarque este quadro de seleção. Se não desejar que as entidades desta camada sejam selecionadas, marque este quadro de seleção. O valor deste campo aparece na ferramenta Seleção da camada na barra de ferramentas Camadas.

Se a camada estiver bloqueada, aparece o ícone [image] na barra de ferramentas Camadas.

Se a camada não estiver bloqueada, aparece o ícone [image] na barra de ferramentas Camadas.

Se uma ou mais camadas tiverem marcado o campo Bloqueado, aparece o ícone [image] na barra de estado.

NOTA: Se você marcar este quadro, você não pode visualizar as entidades na camada através de nenhum dos métodos seguintes:

  uso da janela Propriedades

  seleção delas através de cliques do mouse

  uso de qualquer dos comando de Seleção do menu Selecionar

Visível

Para ver entidades na camada da janela de gráficos, marque este quadro de verificação. O valor deste campo aparece na ferramenta Seleção da camada na barra de ferramentas Camadas.

Se a camada estiver visível, aparece o ícone [image] na barra de ferramentas Camadas.

Se a camada não estiver visível, aparece o ícone [image] na barra de ferramentas Camadas.

Para ocultar entidades na camada, desmarque este quadro de verificação.

NOTA: Se este quadro de verificação for desmarcado, você não pode visualizar as entidades na camada na janela de gráficos do Trimble Geomatics Office.

Aparece o ícone Camadas ocultas [image] na barra de status quando uma ou mais camadas estiverem ocultas. Isto é, este ícone aparece na barra de estado quando uma ou mais camadas tiverem a propriedade Visível desmarcada.

CUIDADO: Se uma camada não estiver visível, não pode-se visualizar ou selecionar entidades daquela camada. Isto aplica-se quando a camada está bloqueada ou desbloqueada. Isto é, a opção Visível sobrescreve a opção Bloqueado.

Novo

Clique Novo para adicionar uma nova camada ao projeto. Uma nova fileira é adicionada no diálogo Camada. Insira valores para cada coluna na nova camada.

Apagar

Clique Apagar para apagar a camada realçada. Se apagar uma camada que possua entidades, aparece um diálogo de aviso. O diálogo adverte que, se a camada for apagada, as entidades naquela camada serão apagadas.

Atual

Clique Atual para que a camada selecionada seja a camada atual. A camada atual é realçada. A camada atual é a camada à qual novas entidades são adicionadas. Todas entidades (pontos, linhas, arcos, curvas e anotações) adicionados ao banco de dados sem um nome de camada incluído são adicionadas à camada atual.

SUGESTÃO: Pode-se editar múltiplas entradas no diálogo Camadas:

1.	Use a tecla Ctrl para selecionar múltiplas entradas.

2.	Edite o último campo realçado. Todas as entradas realçadas serão atualizadas.


    Camadas - Perspectiva geral

Outras Informações

Como ...	Diálogo	Ver também
Perspectiva geral

Na Visualização do plano, cada entidade do projeto pertence à camada. Uma camada consiste de um nome, estilo de ponto, estilo de linha e estilo de texto. A organização dos dados nas camadas facilita a sua administração. Isso é útil na administração de grandes grupos de dados. Por exemplo, todos os pontos com o código da característica ‘árvore’ podem ser agrupados numa camada chamada ‘Árvores’. A não ser que tenha criado novas camadas no projeto, a camada Padrão é utilizada para todas as entidades.

Todas as entidades (pontos, linhas, arcos, curvas, texto e anotações) possuem um campo de Camada. Use a janela Propriedades para visualizar entidades. Para selecionar a camada para uma entidade, use um dos seguintes métodos:

  Quando estiver adicionando uma entidade ao projeto, selecione uma camada do campo Camada no diálogo apropriado.

  Importe um arquivo com a camada especificada.

  Use o processamento de código da característica.

  Para selecionar a camada para entidades existentes do projeto, use a janela Propriedades.

Para administrar as camadas para o projeto, use o diálogo Camadas.

Use a barra de ferramentas Seleção da camada para especificar quais camadas pode-se ver e selecionar. Para selecionar entidades numa determinada camada:

  Escolha Selecionar / Por camada.

Se um ponto do banco de dados estiver com <Por camada> selecionado no campo Estilo do ponto, o estilo do ponto especificado para a camada é designado ao ponto. Se uma linha, curva ou arco estiver com <Por camada> selecionado no campo Estilo de linha, o estilo de linha especificado para a camada é designado à linha, curva ou arco. Igualmente, se um texto ou anotação estiver com <Por camada> selecionado no campo Estilo de texto, o estilo de texto especificado para a camada é designado ao texto ou anotação.


Pontos Duplicados - Perspectiva geral

Outras Informações

Como ...	Diálogo
Perspectiva geral

O Trimble Geomatics Office fornece duas opções para a importação de pontos com o mesmo nome:

1. 	Sempre juntar pontos duplicados

2.	Juntar pontos duplicados dentro da tolerância. Pode-se especificar dentro de que tolerância horizontal ou vertical o software junta os pontos ou que o software simplesmente não resolva nenhum ponto duplicado na importação.

Por padrão, o Trimble Geomatics Office junta pontos com o mesmo nome na importação de modo que pontos duplicados não são criados (esta é a maneira mais rápida de importar dados).

Se você optar por não juntar os pontos duplicados, pontos duplicados serão criados quando se importam um ou mais arquivos que possuam observações ou coordenadas para o mesmo ponto que estejam fora da tolerância. Por exemplo, quando se importa:

  um arquivo que contenha um ponto com o mesmo nome de um ponto existente no banco de dados e que não esteja dentro da tolerância

  pontos com o mesmo nome, de diferentes arquivos do Survey Controller (*.dc)

Se necessário, também pode-se unir pontos de dentro do software, usando o comando Juntar pontos duplicados.

Como o Trimble Geomatics Office junta pontos

Um ponto somente pode contar com uma coordenada WGS-84 inserida pelo usuário e uma coordenada do grid/local inserida pelo usuário. O Trimble Geomatics Office escolhe quais as coordenadas de grid/locais WGS-84 devem ser sobrescritas, seguindo estas normas:

1.	São tomadas as coordenadas de qualidade mais alta.

2.	Será usado o último componente de coordenadas inserido no banco de dados.

O relatório Derivação do ponto fornece detalhes sobre os dados de levantamento usados para coordenar os pontos, enquanto o relatório de Importação enumera todos componentes de coordenada que foram sobrescritos ou descartados.

NOTA: Se o software sobrescrever uma coordenada que você deseja usar, deve-se desfazer a operação de importação, editar o arquivo de importação (ou o nome do ponto do projeto do Trimble Geomatics Office) e re-importar os dados. Alternativamente, desfaça a operação de importação e volte a re-importar os dados, usando a opção Juntar pontos duplicados dentro da tolerância no diálogo Duplicar opções do ponto. Pode-se então simplesmente renomear os pontos duplicados de dentro do Trimble Geomatics Office.


Diálogo Opções de ponto duplicado

Mais informações

Como ...	Ver também

Use o diálogo Opções de ponto duplicado para especificar como o Trimble Geomatics Office administra pontos com o mesmo nome quando eles são importados para um projeto.

As configurações deste diálogo aplica-se à todas opções de importação; importe os arquivos usando a barra do projeto ou arraste e solte arquivos num projeto do Trimble Geomatics Office, o software usa a última configuração das Opções de ponto duplicado especificada. Pode-se criar um modelo para configurar as Opções de ponto duplicado.

Para acessar o diálogo Opções de ponto duplicado:

1.	Selecione Arquivo / Entrada. Aparece o diálogo Importar.

2.	Clique Opções.

As seguintes seções descrevem as opções disponíveis.

Sempre juntar pontos duplicados

Esta opção é selecionada por padrão. O software une pontos com o mesmo nome na importação de modo que pontos duplicados não são criados. Depois da importação, o relatório de importação enumera todos componentes de coordenadas sobrescritos ou descartados.

NOTA: Se o software sobrescreve uma coordenada que queria usar, deve-se desfazer a operação de importação, editar o arquivo de importação (ou o nome do ponto no projeto Trimble Geomatics Office), e re-importar os dados. Alternativamente, desfaça a operação de importação e volte a importar os dados, usando a opção Juntar pontos duplicados dentro da tolerância no diálogo Opções de ponto duplicado. Pode-se então simplesmente renomear os pontos duplicados de dentro do Trimble Geomatics Office.

Juntar pontos duplicados dentro da tolerância

Se você selecionar esta opção, todos dados de levantamento de um ponto são colocados sob o mesmo ponto se ele estiver dentro da tolerância horizontal e/ou vertical especificada. A tolerância padrão é determinada da tolerância horizontal e vertical desconhecida especificada na guia Recomputar do diálogo Propriedades do projeto. Depois da importação, o relatório de Importação enumera todas coordenadas sobrescritas ou descartadas.

Também pode-se usar esta opção para especificar que o software não una pontos duplicados na importação. Para fazer isso, configure a tolerância para importar dados em 0,02 (isto é, a tolerância de qualidade levantamento horizontal) e 0,050 (isto é, a tolerância da qualidade de levantamento vertical). Pode-se então simplesmente renomear os pontos duplicados desde o Trimble Geomatics Office. Se tanto a tolerância horizontal como a vertical forem especificadas, para que pontos duplicados sejam unidos, eles devem estar dentro da tolerância tanto horizontal como vertical. Se a tolerância não for especificada (isto é, no grupo de Tolerâncias, as caixas de seleção Horizontal e Vertical não são marcadas) os pontos duplicados são unidos.

NOTA: Quando se importam dados de nível digital, somente é usada a tolerância vertical.

NOTA: Se a tolerância for configurada para 0,000, as coordenadas com pontos duplicados devem ser exatamente as mesmas para que os pontos sejam unidos.


Comando Abreviar Pontos

Use este comando para criar muitos pontos a partir de um ponto, separando dados:

•	por fonte de dados

•	por todas observações

•	por tipo de dados (GPS/Terrestre)

Para acessá-lo, selecione Editar / Abreviar Pontos.

Aparece o diálogo Abreviar pontos.

Use a opção abreviar pontos para:

  resolver pontos duplicados

  computar posições para cada observação

  efetuar uma calibração no Trimble Geomatics Office quando dados GPS e dados do grid/locais estão sob o mesmo ponto

  separar observações terrestres e de GPS


Diálogo Abreviar Pontos

Um ponto pode conter dados de levantamento de mais de uma fonte de dados. A fonte de dados também pode conter mais de uma observação. No entanto, somente uma observação é usada para derivar a posição calculada do ponto.

Pode-se usar a opção Abreviar Ponto para criar pontos através da separação de dados por fonte de dados, todas as observações ou tipo de dados (GPS/Terrestre). Explodir pontos para:

•	resolver pontos duplicados

•	computar posições para cada observação

•	efetuar uma calibração de local GPS no software Trimble Geomatics Office quando dados GPS e dados de grid/locais estiverem sob o mesmo ponto

•	separar observações terrestres e de GPS

Quando se abreviam pontos, a operação cria pontos com o mesmo nome.

Por exemplo, quando se importa dois arquivos do Survey Controller (*.dc) para o mesmo projeto:

  O primeiro arquivo .dc contém uma observação convencional para o ponto ‘101’.

  O segundo arquivo .dc contém uma coordenada inserida e uma observação GPS ao mesmo ponto ‘101’.

Quando o primeiro arquivo é importado, um só ponto ‘101’ é criado no projeto e a observação é usada para derivar a posição do ponto. Quando o segundo arquivo é importado, o Trimble Geomatics Office compara a coordenada inserida do arquivo .dc com a posição do ponto no projeto. Como os dados de levantamento do arquivo .dc são para o mesmo ponto ‘101’, o ponto do projeto e arquivo .dc são automaticamente juntados num só. Os dados de levantamento virão de duas fontes de dados: o primeiro e segundo arquivo Survey Controller (*.dc). Haverá três grupos de fontes de coordenadas para o ponto:

  Observação convencional

  Coordenada inserida

  Ocupação GPS

SUGESTÃO: Pode-se visualizar a fonte dos dados e observação e conteúdo da coordenada de um ponto no menu da página janela Propriedades.

Somente pode-se abreviar pontos quando houver um ponto no grupo atual de seleção que contenha múltiplas observações ou coordenadas.

Para acessar o diálogo Abreviar Pontos, selecione Editar / Abreviar Pontos.

Abreviar

Para abreviar pontos para criar pontos separados, o software separa dados usando um dos seguintes métodos:

Fonte por dados	Por exemplo, um arquivo .dc.
Por todas observações	Pontos separados são criados de todas observações e coordenadas para o ponto.
Por tipo de dados	Todas observações GPS e coordenadas WGS-84 são colocadas sob um ponto. Todas coordenadas de grid e observações terrestres são colocadas sob outro ponto.
NOTA: Se você necessitar efetuar uma calibração do local GPS no software Trimble Geomatics Office, e observações GPS e coordenadas de grid estiverem sob o mesmo ponto, use a opção Abreviar pontos por tipo de dados. Esta operação cria dois pontos; um ponto de grid e um ponto GPS. Será então possível efetuar uma calibração GPS usando estes pontos.

Renomear pontos GPS com sufixo (_GPS)

Se a opção Por tipo de dados for selecionada, a opção Renomear pontos GPS com sufixo torna-se disponível. Pode-se fazer com que os nomes de pontos sejam únicos escolhendo o sufixo a ser adicionado aos pontos GPS. Se não selecionar esta opção, os pontos são explodidos por tipo de dados e cada ponto terá seu próprio nome.

Mostrar estatísticas da abreviação

Marque este quadro de verificação para apresentar o número de pontos que podem ser criados a partir dos pontos selecionados, usando o método de abreviação selecionado.


Comando Edição múltipla

Ver também

Use este comando para editar as propriedades de entidades relacionadas ao levantamento ao relacionadas ao CAD da seleção. Este comando somente é disponível se existir um grupo de seleção atual.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Editar / Edição múltipla.

  Escolha Edição múltipla do menu de atalho.

Aparece o diálogo Edição múltipla (guia Levantamento ou guia CAD).


Diálogo Edição múltipla - guia Levantamento

Use este diálogo para editar as propriedades relacionadas ao levantamento de entidades múltiplas. Por exemplo, pode-se corrigir as alturas da antena para as ocupações de um grupo de pontos GPS se souber-se que eles foram inseridos incorretamente no campo.

Para acessá-lo, faça um dentre os seguintes:

  Selecione Editar / Edição múltipla.

  Escolha Edição múltipla do menu de atalho.

NOTA: A seleção é validada quando é selecionada. Ela pode tornar-se não disponível se não for uma opção válida para a seleção atual.

Efetuar estas edições nos pontos selecionados

Este grupo contém as propriedades relacionadas ao levantamento que podem ser editadas para pontos selecionados.

Configurar altura da antena para

Marque este quadro de verificação para habilitar os seguintes campos. Use estes campos para mudar as alturas da antena das ocupações do ponto.

Mudar alturas de tamanho	Selecione o valor da altura da antena dos pontos que deseja mudar. A lista contém as alturas inseridas para os pontos selecionados. Somente as alturas da antena com o valor selecionado mudarão.
Nova altura da antena	Insira o valor correto da altura da antena que deseja aplicar.

Configurar detalhes da antena GPS para

Marque este quadro de verificação para habilitar os seguintes campos. Use estes campos para mudar o tipo da antena e/ou método de medição dos pontos selecionados.

Tipo de Antena	Selecionar o tipo de antena para os pontos que deseja mudar.
Medido para	Selecione o método de medição para os pontos que deseja mudar. A lista neste campo depende do tipo de antena selecionada. Se um novo tipo de antena for selecionado, este campo fica vazio.

Configurar detalhe convencional do alvo

Marque este quadro de verificação para habilitar os campos seguintes. Use estes campos para mudar as alturas do alvo e constantes do prisma dos pontos selecionados.

Altura do alvo	Insira a altura correta do alvo que deseja aplicar.
Constante do prisma	Insira a constante correta do prisma que deseja aplicar.

Configurar altura do alvo laser

Marque este quadro de verificação para habilitar este campo. Insira a altura correta do alvo que deseja aplicar.

Efetuar estas edições para as observações selecionadas

Este grupo contém as propriedades relacionadas ao levantamento que podem ser editadas para as observações selecionadas (GPS, Convencional, Laser).

Usar no ajuste da rede

Marque este quadro de verificação para habilitar o campo. Sirva-se deste campo para usar (ou excluir) as observações selecionadas num Ajuste da Rede (se tiver instalado o módulo de Ajuste da Rede).

Esta configuração somente aplica-se às observações GPS que possuam informações de covariância (QC2). Quando isso é configurado para Não, as observações serão desabilitadas para um ajuste da rede. No entanto, elas ainda são usadas durante a recomputação para determinar as posições dos pontos.

Configurar status da observação para

Marque este quadro de verificação para habilitar o campo. Use este campo para habilitar ou desabilitar uma observação durante a recomputação ou para habilitar as observações como uma verificação.

Quando as observações são desabilitadas, as observações não serão utilizadas durante a recomputação e qualquer fechamento equivocado será especificado para estas observações. Se você habilitar as observações como verificação, as observações serão usadas para coordenar um ponto se nenhuma outra observação habilitada ou coordenadas estiverem disponíveis.

Suprimir sinalizadores de tipo

Marque este quadro de verificação para habilitar o campo. Selecione os tipos de sinalizadores de avisos que deseja suprimir na visualização do Levantamento. Sinalizadores de aviso reaparecerão se uma recomputação for efetuada.

NOTA: Ao marcar um quadro de verificação para editar um determinado campo, o Trimble Geomatics Office efetua uma verificação nas entidades selecionadas. Se ele encontrar que os campos não estão sendo usados nas entidades selecionadas, a opção do quadro de verificação será desabilitada.


Diálogo Edição múltipla - guia CAD

Use este diálogo para editar as propriedades relacionadas ao CAD das entidades da seleção.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Editar / Edição múltipla.

  No menu de atalho, escolha Edição múltipla.

Efetuar estas edições nos pontos selecionados

Este grupo contém as propriedades relacionadas ao CAD que você pode editar para pontos selecionados.

Configurar código de característica para

Marque este quadro de verificação para habilitar o campo. Insira o valor do código da característica que deseja aplicar nos pontos selecionados.

Configurar camada para

Marque este quadro de verificação para habilitar este campo. Selecione a camada que deseja designar para os pontos selecionados. Se inserir uma camada que não existe, aparece o diálogo Nova Camada.

Configurar estilo de ponto para

Marque este quadro de seleção para habilitar o campo. Selecione o estilo de ponto que deseja aplicar aos pontos selecionados. Se inserir um estilo de ponto que não existe, aparece o diálogo Criar Estilo do Ponto.

Remover todas as anotações

Marque este quadro de seleção para remover todas anotações designadas aos pontos selecionados.

Efetuar estas edições no trabalho de linha selecionado

Este grupo contém as propriedades relacionadas ao CAD que pode-se editar para o trabalho de linha selecionado (linhas, curvas, arcos).

Configurar camada para

Marque este quadro de verificação para habilitar o campo. Selecione a camada que deseja designar ao trabalho de linha selecionado. Se você inserir uma camada que não existe, aparece o diálogo Nova Camada.

Configurar estilo de linha para

Marque este quadro de verificação para habilitar o campo. Selecione o estilo de linha que deseja aplicar ao trabalho de linha selecionado. Se você inserir um estilo de linha que não existe, aparece o diálogo Criar Estilo de Linha.

Remover todas as anotações

Marque este quadro de seleção para remover todas anotações designadas ao trabalho de linha selecionado.

Efetuar estas edições no texto selecionado

Este grupo contém os campos que podem ser editados para o texto selecionado.

Configurar camada para

Marque este quadro de verificação para habilitar o campo. Selecione a camada que deseja designar ao texto selecionado. Se você inserir uma camada que não existe, aparece o diálogo Nova Camada.

Configurar estilo de texto para

Marque este quadro de verificação para habilitar o campo. Selecione o estilo de texto que deseja aplicar ao texto selecionado. Se você inserir um estilo de texto que não existe, aparece o diálogo Criar Estilo de Texto.


    Comando Habilitar / Desabilitar Observações

Use este comando para habilitar ou desabilitar uma observação. Desabilitando uma observação não permite que ela seja usada em nenhuma computação de levantamento.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Editar / Habilitar / desabilitar observação.

  Na janela Propriedades, use o campo Status de uma observação

  Na diálogo Edição múltipla / guia Levantamento use o campo Configurar status da observação para.

NOTA: Uma recomputação considera o status das observações na determinação da posição calculada para um ponto. Pode-se usar a função Habilitar / desabilitar observação  para desabilitar o status de uma observação de modo que ela seja removida da recomputação.

Pode-se somente mudar o status de observações quando:

•	Houver um grupo atual de seleção, e

•	Todas as observações do grupo de seleção possuírem o mesmo status de observação.

NOTA: Pode-se configurar o status de múltiplas observações se você possuir mais de uma no seu grupo atual de seleção.

Quando se desabilita uma observação, a cor das linhas de observação mudam para vermelho escuro.

NOTA: Se houverem múltiplas observações ao longo da mesma linha, a observação somente é exibida em vermelho se todas as observações forem desativadas.


    Comando Inverter fluxo da observação

Vetores são aplicados na direção na qual eles são observados. Use este comando para inverter a direção de uma observação e forçá-la a ser aplicado na direção oposta.

Para acessá-lo, selecione Editar / Inverter fluxo da observação.

Ao inverter a direção da observação, as coordenadas calculadas e qualidades de um ponto podem mudar. Deve-se usar o processo de recomputação para aplicar a observação e calcular novas posições de pontos.

CUIDADO: Se o ponto do qual você deseja que o fluxo de observação não possua uma posição conhecida (tal como um ponto RTK observado), a observação não será aplicada.


Diálogo Nova camada

Use este diálogo para criar uma nova camada. Este diálogo aparece se você inserir um nome de camada que não existe quando se insere ou edita entidades (pontos, linhas, curvas, arcos, texto).

Nome

Insira um nome para a camada à qual você deseja que a entidade selecionada seja movida.

Estilo do ponto

Selecione um estilo de ponto da lista. As entradas da lista são os estilos predefinidos da Trimble e novos estilos de pontos criados no Trimble Geomatics Office (usando Editar / Estilos), ou durante o processamento de código da característica.

Para maiores informações, ver a Ajuda da utilidade Editor de Característica e Atributos.

Este estilo de ponto é aquele usado para todos pontos desta camada que possuam <Por camada> selecionado para os seus estilos de ponto.

Estilo de linha

Selecione um estilo de linha da lista. As entradas da lista são os estilos predefinidos da Trimble e novos estilos de linha criados no Trimble Geomatics Office (usando Editar / Estilos), ou durante o processamento de código da característica.

Este estilo de linha é aquele usado para todas linhas desta camada que possuam <Por camada> selecionado para os seus estilos de linha.

Estilo de texto

Selecione um estilo de texto da lista. As entradas da lista são os estilos predefinidos da Trimble e novos estilos de texto criados no Trimble Geomatics Office (usando Editar / Estilos).

Este estilo de texto é aquele usado para todo texto desta camada que possuam <Por camada> selecionado para os seus estilos de texto.

Bloqueado

Para permitir que entidades da camada sejam selecionadas na janela de gráficos do Trimble Geomatics Office, desmarque este quadro de seleção. Se não desejar que as entidades desta camada sejam selecionadas, marque este quadro de seleção. O valor deste campo aparece na ferramenta Seleção da camada na barra de ferramentas Camadas.

Se a camada estiver bloqueada, aparece o ícone [image] na barra de ferramentas Camadas.

Se a camada não estiver bloqueada, aparece o ícone [image] na barra de ferramentas Camadas.

Se uma ou mais camadas tiverem marcado o campo Bloqueado, aparece o ícone [image] na barra de estado.

NOTA: Se você marcar este quadro, você não pode visualizar as entidades na camada através de nenhum dos métodos seguintes:

  uso da janela Propriedades

  seleção delas através de cliques do mouse

  uso de qualquer dos comando de Seleção do menu Selecionar

Visível

Para ver entidades na camada da janela de gráficos, marque este quadro de verificação. O valor deste campo aparece na ferramenta Seleção da camada na barra de ferramentas Camadas.

Se a camada estiver visível, aparece o ícone [image] na barra de ferramentas Camadas.

Se a camada não estiver visível, aparece o ícone [image] na barra de ferramentas Camadas.

Para ocultar entidades na camada, desmarque este quadro de verificação.

NOTA: Se este quadro de verificação for desmarcado, você não pode visualizar as entidades na camada na janela de gráficos do Trimble Geomatics Office.

Aparece o ícone Visível [image] na barra de status quando uma ou mais entidades da camada estiverem ocultas. Isto é, este ícone aparece na barra de estado quando uma ou mais camadas tiverem a propriedade Visível desmarcada.

CUIDADO: Se uma camada não estiver visível, não pode-se visualizar ou selecionar entidades daquela camada. Isto aplica-se quando a camada está bloqueada ou desbloqueada. Isto é, a opção Visível sobrescreve a opção Bloqueado.


Comando Mover pontos e texto

Use este comando para acessar o diálogo Mover pontos e texto. Este comando somente é disponível se você possuir um grupo de seleção atual. Para acessá-lo, selecione Editar / Mover pontos e texto.

Aparece o diálogo Mover pontos e texto.


Diálogo Mover

Use este diálogo para mover pontos ou texto.

Para acessá-lo, selecione Editar / Mover pontos e texto.

Pontos com uma qualidade de Controle, Controle fixo ou Ajustado não são movidos. Se um ponto selecionado para mover possuir uma qualidade de Ajustado, Controle fixo ou Controle, aparece uma mensagem.

AVISO: A moção de um ponto desabilitará todas observações ao ponto ou coordenadas para aquele ponto. Pode-se reabilitá-los usando a janela Propriedades. A reabilitação de observações e coordenadas pode fazer com que o ponto movido seja deslocado para a sua posição original.

Selecione o texto ou pontos e insira o novo local no diálogo. A moção ocorre quando se clica OK no diálogo.

Mover por

Selecione a opção Mover por para mover o texto selecionado ou pontos para um novo local definido pelas mudanças do norte e leste (deltas).

São disponíveis duas opções:

Delta leste	Esta opção adiciona o valor do delta leste apresentado para o Leste de todas entidades selecionadas.

Delta norte	Esta opção adiciona o valor do delta norte apresentado para o Norte de todas entidades selecionadas.

Mover para ponto

Marque o quadro de verificação Mover para ponto para mover os pontos selecionados para a posição de outro ponto.

Nome

Use este campo para nomear ou selecionar o ponto no novo local.

Mover para coordenada

Marque o quadro de seleção Mover para coordenada para mover o texto ou ponto selecionados para a nova posição. São disponíveis duas opções:

Leste	Use este campo para inserir ou selecionar o novo valor Leste para o ponto selecionado.

Norte	Use este campo para inserir ou selecionar o novo valor Norte para o ponto selecionado.

Configurar elevações para nulo

Marque o quadro de verificações Configurar elevações para nulo para configurar as elevações do ponto para os pontos movidos para nulo. Se você não selecionar esta opção, a elevação existente do ponto será mantida.

NOTA: Todas observações para um ponto que foi movido serão desabilitadas.


Diálogo Pontos Duplicados

Mais informações

 Ver também

Ao importar um arquivo que contenha um ponto com o mesmo nome de outro ponto no projeto, o resultado é que pontos com o mesmo nome são criados no projeto. Aparece o diálogo Pontos Duplicados, com a seguinte mensagem:

A importação criou pontos com o mesmo nome no banco de dados (pontos duplicados).

Pode-se resolver o problemas destes pontos duplicados quando:

  juntando os pontos com nomes duplicados se você souber que eles são para o mesmo ponto físico

  renomeando os pontos com nomes duplicados se eles não são o mesmo ponto físico


Comentários

Os seus comentários sobre a documentação de suporte ajuda-nos melhorar a documentação em cada nova revisão. O contribuintes de avaliações particularmente úteis receberão um presente de agradecimento.

Para enviar os comentários, faça um dentre o seguinte:

  Mande um e.mail para ReaderFeedback@trimble.com

  Preencha o Formulário de Comentários de Leitor no final do manual e mande-o pelo correio ou fax, de acordo com as instruções na base do requerimento. Se o comentário do leitor não estiver disponível, pode-se enviar os comentários e sugestões para:

Trimble Navigation Limited
645 North Mary Avenue
P.O. Box 3642
Sunnyvale, CA 94088-3642
E.U.A.

Attention: Technical Publications Group

Telefone: +1-408-481-8940
1-800-545-7762
Fax: +1-408-481-7744
www.trimble.com/

Todos os comentários e sugestões tornam-se propriedes da Trimble Navigation Limited.

Muito obrigado pela sua contribuição.


Comando Novo Projeto

Use este comando para criar um novo projeto ou Modelo.

Para acessá-lo, faça um dentre os seguintes:

  Selecione Arquivo / Novo Projeto.

  Clique o botão Novo Projeto [image] na barra de ferramentas padrão.

Aparece o diálogo Novo Projeto.


Diálogo Novo Projeto

Use este diálogo para criar um novo projeto ou Modelo.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Arquivo / Novo Projeto.

  Clique o botão Novo Projeto [image] na barra de ferramentas padrão.

  Clique o atalho Novo Projeto da barra do Projeto.

Nome

Insira o nome do projeto que deseja criar. Uma nova pasta com o nome do projeto é criada dentro da pasta do projeto atual como foi selecionada através do botão Pasta.

Modelo

A lista do Modelo exibe os modelos do projeto disponíveis no seu sistema. O uso de modelos do sistema no Trimble Geomatics Office é parecido com o uso de modelos de documentos do Microsoft Word ou desenhos protótipos no AutoCAD. Cria-se cada novo projeto com o uso de um modelo para formar a base do seu novo projeto. O modelo usado não muda.

SUGESTÃO: Novos estilos de CAD adicionados a um modelo são disponíveis em projetos com base naquele modelo. Onde um trabalho em prosseguimento numa determinada área provavelmente requererá uma série de projetos individuais, talvez você queira criar um modelo que inclua o específico sistema de coordenadas para a área, estilos especiais e pontos de controle, por exemplo, de modo que eles estejam disponíveis imediatamente em todos os novos projetos.

Uma vez que os modelos de projeto tenham sido definidos, pode-se usar estes modelos muitas vezes para muitos diferentes projetos.

A partir dos nomes de modelos apresentados na lista, selecione o modelo mais apropriado. O modelo selecionado forma a base para o novo projeto que se está criando.

Detalhes

A lista de Detalhes mostra os detalhes do sistema de coordenadas e os Títulos do modelos selecionado. Isso ajuda a selecionar o modelo mais apropriado.

Além disso, aparece a pasta onde o projeto é criado e mantido. Esta pasta reflete o que é definido, diretamente no campo Nome ou através do uso da função Pasta.

As opções da projeção são predefinidas no projeto modelo; e a projeção pode se mudada.

Pasta

Clique em Pasta para selecionar a pasta onde você deseja criar um novo projeto.

A seleção de uma pasta através do uso da função Pasta muda o local padrão usado pelo Trimble Geomatics Office na próxima vez que você abrir ou criar um projeto.

Use a estrutura de pastas em forma de árvore mostrada no diálogo Procurar pasta para fazer um dentre o seguinte:

  Selecionar diretamente uma pasta do projeto.

  Selecionar a pasta que contém uma série de projetos.

Novo

Clique Novo para criar um novo projeto ou um novo modelo.

Quando se configura para modelo, pode-se criar um novo modelo na pasta apropriada com base no modelo atualmente selecionado. Pode-se usar isso para gerar novos modelos para fins específicos.


Comando Abrir projeto

Use este comando para abrir um projeto existente.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Arquivo / Abrir projeto.

  Clique o botão Abrir projeto [image] na barra de ferramentas padrão.

Aparece o diálogo Abrir projeto.


Diálogo Abrir projeto

Use este diálogo para abrir um projeto existente.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Arquivo / Abrir projeto.

  Clique o botão Abrir projeto [image] na barra de ferramentas padrão.

NOTA: Se você já tiver um projeto aberto, lhe será avisado que esta ação fechará este projeto.

NOTA: Uma visualização do projeto é exibida no diálogo Abrir projeto.

Nome

Insira o nome do projeto que deseja abrir.

Uma lista de projetos na atual pasta de projetos aparece abaixo do campo Nome. Selecione um destes nomes de projeto para inserir, automaticamente, o seu nome no campo Nome.

Pode-se também inserir um caminho no campo Nome para um projeto que deseje abrir.

Por exemplo, você pode possuir vários projetos na pasta MYPROJ na unidade C:\.

Insira C:\myproj\. O Trimble Geomatics Office mostra os projetos desta pasta que podem ser selecionados. Abrindo um projeto deste modo não muda a pasta padrão do projeto como o faz quando se clica em Pasta. Veja a descrição do botão Pasta abaixo.

Pasta

Clique Pasta para selecinar a pasta da qual um projeto deve ser aberto.

Use a estrutura em forma de árvore mostrada no diálogo Procurar pasta para fazer um dos seguintes:

  Selecionar diretamente uma pasta do projeto.

  Selecionar a pasta que contenha uma série de projetos.

Detalhes

A lista de Detalhes mostra o sistema de coordenadas e os títulos do projeto e contém a pasta onde o projeto está armazenado. Use estes detalhes como auxílio para abrir o projeto apropriado. Detalhes podem ser alterados em Arquivo / Propriedades do Projeto / etiqueta Unidade e Formatos.

NOTA: Se você não possuir o módulo de Processamento de Linha de Base WAVE ou o módulo Ajuste da Rede instalados, quando se abre um projeto existente criado com estes módulos, os dados de levantamento permanecem inalterados. Pode-se visualizar dados derivados de módulos incapacitados (tais como elipses de erro e linhas de base processadas). Posteriores tarefas que requeiram o uso dos módulos incapacitados não são disponíveis.


Comando Fechar Projeto

Use este comando para fechar o projeto atual.

Para acessá-lo, selecione Arquivo / Fechar Projeto.

Todas mudanças efetuadas num projeto (incluindo Grupos de seleção salvados e Visualizações) são salvadas na medida que se trabalho no projeto. Pode-se fechar um projeto sem antes salvá-lo.


Comando Apagar projeto

Use este comando para apagar um projeto.

Para acessá-lo, selecione Arquivo / Apagar Projeto.

Aparece o diálogo Apagar Projeto.


Diálogo Apagar Projeto

Use este diálogo para apagar um projeto. O projeto deve ser fechado.

Para acessá-lo, selecione Arquivo / Apagar projeto.

SUGESTÃO: Pode-se recuperar um projeto apagado da Lixeira.

Nome

Insira o nome do projeto que deseja apagar.

No diálogo Apagar, aparece uma lista de projetos na atual pasta de projetos sob o campo Nome. Selecione um destes nomes de projeto para inserir automaticamente o nome no campo Nome.

Pode-se também inserir um caminho para o diretório para um projeto que queira apagar.

Por exemplo, você poderia ter vários projetos na pasta MYPROJ da unidade C:\.

Insira C:\myproj\. O Trimble Geomatics Office mostra os projetos nesta pasta que podem ser selecionados. Apagar um projeto deste modo não muda a pasta padrão do projeto como o faz quando se clica o botão Pasta. Veja a descrição do botão Excluir grupo abaixo.

Excluir grupo

Para visualizar os projetos que deseja apagar, selecione a opção Projeto.

Para visualizar os modelos que deseja apagar, selecione a opção Modelo.

Pasta

Clique Pasta para selecionar a pasta da qual um projeto deve ser apagado. A seleção de uma pasta usando a opção Pasta o padrão que o Trimble Geomatics Office usa a próxima vez que se abre ou cria um projeto.

Use a estrutura de pastas em forma de árvore mostrada no diálogo Procurar pasta para fazer um dentre o seguinte:

  Selecionar diretamente uma pasta do projeto.

  Selecionar a pasta que contém uma série de projetos.

Apagar

Clique Apagar para apagar o projeto selecionado. Todas as pastas e arquivos incluídos no projeto são apagados.

Detalhes

O grupo Detalhes mostra os detalhes do sistema de coordenadas e os Títulos do projeto e apresenta a pasta onde o projeto está armazenado. Use este detalhes como auxílio para confirmar que se está apagando o projeto atual.


Comando Importar

Use este comando para abrir o diálogo Importar.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Arquivo / Importar.

  Clique o botão Importar [image] da barra de ferramentas padrão.

  Use o grupo Importar na barra do Projeto.

Aparece o diálogo Importar.


Comando Exportar

Use este comando para exportar dados para outro formato ou para um dispositivo da da Trimble.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Arquivo / Exportar.

  Clique o botão Exportar [image] da barra de ferramentas padrão.

Aparece o diálogo Exportar.


Comando Ajuste da Folha

Use este comando para mudar as configurações da folha antes de criar um desenho.

Pode-se:

  selecionar a formulário do plano que deseja usar para o desenho

  especifique a escala, origem e orientação do desenho

Para acessá-lo, selecione Arquivo / Ajuste da Folha.

Aparece o diálogo Ajuste da Folha.


Diálogo Ajuste da Folha

Use este diálogo para mudar as configurações do leiaute da folha antes de criar um desenho. Pode-se selecionar esta formulário do plano que deseja usar para o seu desenho e designar a escala, origem e orientação do desenho.

Para acessá-lo, selecione Arquivo / Ajuste da Folha.

Formulário do plano

Um Formulário do plano fornecem um modelo no qual se cria o desenho. Pode-se personalizar este modelo para fornecer componentes do desenho (tais como um seta Norte ou o logotipo da sua companhia) como também recorte de região, quadro, trabalho de linha e anotação de texto. O formulário do plano é aplicado ao tamanho da folha configurada para a impressora ou plotadora escolhida e será conforme com a configuração retrato ou paisagem para a impressora ou plotadora.

Pode-se mudar estas configurações usando a opção Configurar impressão.

No campo Arquivo, insira um nome de arquivo do formulário do plano desejado no campo Arquivo.

Procurar

O diálogo Procurar mostra uma lista de arquivos formulário do plano (*.frm) disponíveis.

Selecione o nome de arquivo do formulário do plano requerido.

A Trimble Navigation Limited fornece diferentes formulários de plano para serem usados. pode-se criar seus próprios formulários de plano. Para maiores informações, consulte Formulário de Plano – Perspectiva geral.

Escala, rotação do desenho, Origem N (Norte), Origem L (Leste)

Use estes campos para definir a área do projeto a ser desenhado.

Uma vez que você tenha configurado uma escala, um “quadro de desenho” que representa a área do projeto a ser desenhado, aparece na janela de gráficos. Ele está baseado nas coordenadas de origem. Mude a escala para aumentar ou diminuir a cobertura do desenho.

SUGESTÃO: Configure o campo Traçar rotação para um valor para a orientação requerida do desenho. O valor neste campo configura a orientação do lado da folha do desenho ao invés da rotação do ponto norte no desenho. O quadro do desenho pode mover-se. Se o fizer, mova-o graficamente em torno dos dados para encaixar os dados do projeto.

Clique o campo Norte de origem ou Leste de origem, e clique e arraste o ‘quadro de desenho’ para cobrir a área requerida. Pode-se configurar o campo Traçar rotação para um valor que forneça a orientação requerida do desenho. Usando este campo, você estará especificando a orientação do lado da folha do desenho ao invés da rotação do ponto norte do desenho.

OK

Clique OK para confirmar a configuração da folha do desenho. Estes detalhes de configuração são armazenados e usados na opção Desenhar/Imprimir.

Melhor ajuste

Clique Melhor ajuste para que o sistema calcule os melhores valores para os campos Escala e Origem para desenhar todos os dados do projeto que está sendo visualizado. O padrão da Traçar rotação será de 0° quando se usa esta opção.

Configurar impressão

Clique Configurar impressão para abrir o diálogo Configurar impressão para o seu sistema. Use este diálogo para selecionar a impressora ou plotadora apropriada, escolher o tamanho e fonte de papel e selecionar a orientação do desenho no papel (retrato ou paisagem).


Formulários do plano - Perspectiva geral

Um arquivo de formulário do plano (*.frm) é armazenado como um arquivo de texto. Ele contém uma série de afirmações que descrevem o que deve ser colocado no formulário do plano e onde deve ser colocado. Pode-se incluir num formulário do plano linhas, texto, símbolos (por exemplo, ponto Norte) e metarquivos melhorados do Microsoft Windows (*.wmf) para construir o leiaute desejado.

Comentários

Nos formulários de plano fornecidos, existem comentários para explicar o significado dos diferentes comandos disponíveis na definição do formulário do plano. Use um editor de texto para editar uma definição do formulário do plano. As definições do formulário do plano fornecidas geralmente estão localizadas na pasta do Sistema dentro da principal pasta do programa (tipicamente, C:\Arquivos de programas\Trimble\Trimble Geomatics Office).

SUGESTÃO: Durante a instalação do Trimble Geomatics Office, o editor de texto Notepad da Microsoft é designado para a operação Abrir para a extensão de arquivo. Portanto, quando estiver selecionando um arquivo do formulário do plano ou quando estiver no programa Microsoft Windows Explorer, se você realçar um arquivo .frm, pode-se usar a opção Abrir no menu de atalho para apresentar os detalhes do formulário do plano no Notepad da Microsoft.

Para maiores informações, consulte Detalhes de Definição do Formulário do Plano.


Detalhes de Definição do Formulário do Plano

 Perspectiva geral

As definições do formulário do plano são armazenadas num formato parecido com o formato de arquivo padrão do Windows *.ini. Ele consiste de uma série de títulos de seções dentro de colchetes ( [ ] ). Dentro de cada seção ítens individuais são definidos, com cada item tendo um nome singular e recebendo um valor apropriado usando um caractere ‘=’. Comentários podem ser colocados dentro de um arquivo mas os comentários devem estar numa linha própria e a linha deve começar com um ponto e vírgula (;).

Um sistema de coordenadas especial dentro das definições do formulário do plano permite o mesmo formulário do plano ser usado em diferentes tamanhos de papel para desenho. Todos valores de coordenadas são considerados serem em milímetros e são sempre especificados em pares separados por vírgula dentro de parênteses, com o valor x (ou horizontal) primeiro e o valor y (ou vertical) segundo.

Por exemplo, (20,40) é uma posição válida de coordenada. O ângulo no qual se pode desenhar na esquerda superior da folha é definido como tendo as coordenadas +0.0, +0.0. Todos os valores positivos de coordenadas são interpretados como estando à direita e abaixo desta posição. O ângulo no qual se pode desenhar na direita inferior da folha é definido como tendo as coordenadas –0.0, –0.0. Todos os valores negativos de coordenadas são interpretados como estando à esquerda e acima desta posição.

NOTA: Os ângulos nos quais se pode desenhar numa folha são os limites do desenho atual (ou impressão) que podem ser feitos numa determinada folha pela plotadora ou impressora. Estes limites variam em diferentes plotadoras e impressoras. Os limites são afetados por fatores tais como a folha é mantida no rolos de uma plotadora, por exemplo.

Para ilustrar, a tabela abaixo exibe as várias posições de coordenadas e suas interpretações:

Seções

As seções de uma definição do formulário do plano são como no seguinte:


Comando Plotar / Imprimir

Use este comando para:

  Visualizar uma lista de plotadoras e impressoras instaladas.

  Configurar a plotadora ou impressora padrão.

  Acessar outras opções da plotadora ou impressora para a plotadora ou impressora selecionada.

Para acessá-la, faça um dentre o seguinte:

  Selecione Arquivo / Plotar/Imprimir.

  Pressione Ctrl+P.

Antes de poder imprimir no Trimble Geomatics Office, deve-se:

  Conectar a plotadora ou impressora ao computador ou rede.

  Instalar uma unidade plotadora ou impressora usando o Programa de Instalação do Microsoft Windows ou o Painel de Controle do Microsoft Windows, se um ainda não estiver presente. Para maiores informações, consulte a Ajuda do Microsoft Windows.

  No diálogo de Configuração Desenhar / Imprimir, selecione a plotadora ou impressora que deseja utilizar.

NOTA: Se você contar com linhas de grid exibidas na janela de gráficos, elas aparecerão no seu traçado.


Comando Propriedades do projeto

Use este comando para abrir o diálogo Propriedades do projeto. Para acessá-lo, selecione Arquivo / Propriedades do projeto.


Comando Último projeto

O menu arquivo apresenta uma lista dos quatro últimos projetos que foram abertos recentemente.

Para abrir um projeto usado recentemente, selecione um da lista de menu do Arquivo.


Comando Sair

Use este comando para fechar o projeto atual e sair do Trimble Geomatics Office.

O software Trimble Geomatics Office salva automaticamente as suas mudanças.


Comando Copiar projeto

Use este comando para fazer uma copiar de um projeto existente no Trimble Geomatics Office. Este comando somente é disponível quando não há nenhum projeto aberto.

Aparece o diálogo Projeto para copiar.


Diálogo Projeto para copiar

Use este diálogo para selecionar o projeto que você deseja copiar.

Para acessar este diálogo:

  Selecione Arquivo / Copiar projeto.

Esta opção somente é disponível quando não há nenhum projeto aberto.

Selecione um projeto da lista.

Os detalhes para o projeto selecionado aparecem sob a lista de projetos.

Pasta

Para selecionar um projeto de uma pasta diferente, clique Pasta.

Quando tiver selecionado um projeto que deseja copiar, clique OK.

Aparece o diálogo Copiar projeto para.


Diálogo Copiar projeto para

Use este diálogo para inserir o novo nome para o projeto que se está copiando.

Título do projeto

Insira o nome para o projeto.

Pasta

Faça um dentre o seguinte:

  Clique o botão de reticências para copiar o projeto para uma pasta diferente.

  Insira o caminho da pasta usando o teclado.


Site do Protocolo de Transferência de Arquivo (FTP)

Use o site FTP da Trimble para enviar ou receber arquivos tais como emendas de software, utilidades e respostas para Questões Formuladas com Freqüência (FAQs). Pode-se acessar o site FTP da partir do site WWW da Trimble:  www.trimble.com/support/support.htm


Formatos GIS - Perspectiva Geral

Mais Informações

Como ...	Ver também
Perspectiva Geral

Pode-se exportar pontos e seus atributos associados do Trimble Geomatics Office para uma série de formatos do Sistema de Informações Geográficas (GIS). Linhas, arcos, curvas, texto e anotações não são exportadas.

Consulte a tabela seguinte:

Durante a exportação, pode-se criar novos atributos para exportação (por exemplo, a hora ou data em que o atributo foi coletado, ou a elevação do ponto).

Também pode-se criar formatos de exportação ASCII personalizados ou de relatório para exportar pontos e seus atributos.

Dois Formatos GIS Personalizados são listados:

  Nome,Latitude,Longitude,Altura,Todos Atributos (Local)

  Nome,Norte,Leste,Elevação,Todos Atributos

Use a guia GIS para exportar dados para uma série de formatos GIS.

Para acessar esta guia:

1.	Escolha uma das seguintes opções:

  Selecione Arquivo / Exportar.

  Use o grupo Exportar da barra do Projeto.

Aparece o diálogo Exportar.

2.	Selecione a guia GIS.

Pode-se mover formatos personalizados para esta guia. Para maiores informações, consulte o arquivo Asciiexp.dat.

Para informações sobre a exportação para um formato GIS, consulte Formatos de exportação GIS.

Esta guia possui os seguintes formatos:


Opção arquivos ArcView (*.dbf, *.shp, *.shx)

Quando se exporta o formato ArcView, três arquivos são criados para cada código de característica com atributos.

A seguinte tabela descreve estes arquivos:

Estes arquivos são arquivos binários. Não pode-se visualizar ou editar estes arquivos com um editor de texto.

O Trimble Geomatics Office automaticamente dá nome a estes arquivos.

Por exemplo, se possuir pontos com atributos para o código da característica ‘Árvore’, os seguintes arquivos são criados:

  Árvore.shp

  Árvore.shx

  Árvore.dbf

Para informações sobre as configurações ArcView, consulte o tópico diálogo Opções de exportação. O ArcView não possui nenhuma configuração extra além daquelas para todos formatos.

NOTA: Somente versões 3.1 ou mais recentes do ArcView suportam pontos 3D.


Opção Arquivo AutoCAD com atributos (*.dxf)

Quando se exporta para a opção Arquivo AutoCAD com atributos (*.dxf), cria-se um arquivo .dxf.

Use arquivos do formato Drawing eXchange Format (.dxf) para a permuta e visualização de dados gráficos e tabulares.

Configurar

Além das configurações padrão descritas no tópico do diálogo Opções de Exportar, também existem as configurações específicas do AutoCAD.

Clique Opções. Aparece o diálogo Opções de Exportar.

Tamanho do texto

Existem duas opções para a especificação do tamanho do texto no arquivo de saída:

Automático	O tamanho do texto é calculado automaticamente do arquivo de entrada.
Fixo	O tamanho do texto é fixo. Escolha uma das seguintes opções:   No campo Tamanho do texto, insira o tamanho do desenho que deseje.   Use os botões de seta.
Opções de lote

Marque a caixa de seleção Selecionar as Características de exportação em lotes para exportar as informações de atributo em lotes. Isso significa que os atributos podem ser perguntados e editados quando lidos num sistema GIS ou CAD que suporta o formato .dxf. O grupo Ponto de inserção do lote torna-se disponível. São duas as opções para a colocação do ponto de inserção num lote:

  Origem	Coloque o ponto de inserção na posição 0,0 do lote.

  Centróide	Coloque o ponto de inserção no centróide calculado do lote.

Se a caixa de seleção Exportar características em lotes não estiver marcada, estas opções não serão disponíveis. Ao invés, as informações da posição de uma característica são armazenadas como uma entidade  POLILINHA ou PONTO e as informações de atributo são escritas como TEXTO. O TEXTO é escrito na camada apropriada para cada característica. O grupo Ponto de inserção do lote não é disponível.

NOTA: Se não exportar em lotes, nomes de atributo não serão exportados—somente os valores para os atributos. Se estiver exportando para qualquer dos pacotes GIS do AutoCAD, por exemplo o AutoCAD Map, sempre exporte em blocos, para que os nomes de atributo sejam incluídos.

Opções de camada

Os arquivos .dxf organizam diferentes informações em camadas. Estas camadas podem ser manipuladas independentemente umas das outras. São duas as opções de camadas:

  Uma característica por camada – uma camada diferente é criada para cada característica. Por exemplo, características de poste são colocadas numa camada diferente de características árvore. O nome de cada camada é o nome da característica.

  Todas características numa camada – todas características são colocadas numa só camada. O campo Nome da camada é disponível. Insira o nome da camada no campo Nome da camada. O campo Nome da camada não pode ser deixado em branco.

Mudar espaços para sublinhados nos nomes de característica

Alguns programas que lêem arquivos .dxf requerem que os nomes de camadas de arquivos .dxf não tenham espaço. Selecione esta opção para converter todos espaços de nomes de características para o caractere sublinhado (_).


Opção Arquivos MapInfo (*.mif, *.mid)

Quando exportar para o formato MapInfo, dois arquivos são criados para cada código de  característica com atributos. Eles são tratados na seguinte tabela:

Estes arquivos são arquivos de texto. Pode-se visualizá-los e editá-los com um editor de texto. Um exemplo de cada um destes arquivos está ilustrado abaixo:

Arquivo MIF

VERSÃO 2

  DELIMITIDAOR "	"

  PROJEÇÃO TERRA SISCOORD 1, 104

COLUNAS 3

  Altura_m  DECIMAL(5,0)

  Necessita_atenção  CAR(30)

  Comentários  CAR(30)

DADOS

PONTO 700345.32 306565.45

PONTO 700356.47 306125.38

PONTO 700937.71 306505.41

Arquivo MID

1	Sim	Galhos em fios elétricos

2	Sim	Morta

3	Não	Imediatamente ao lado do poste

O Trimble Geomatics Office nomeia estes arquivos automaticamente. Por exemplo, se há pontos com características para o código de característica ‘árvore’, os seguintes arquivos são criados:

  árvore.mif

  árvore.mid

MapInfo não possui nenhuma configuração extra além daquelas para todos formatos. Elas são descritas no tópico diálogo Opções de Exportar.

NOTA: O MapInfo suporta somente pontos bidimensionais.


Opção Arquivo Microstation (*.dgn)

Quando se exporta para o formato Microstation (*.dgn), um arquivo é criado. Deve-se inserir o nome para o arquivo que deseja exportar.

Configurar

Além das configurações disponíveis para todos os formatos do diálogo Opções de Exportar, as seguintes opções são disponíveis para configurar como se quer exportar para o formato Microstation DGN.

Tornar selecionável

Marque esta caixa de seleção para ter certeza de que o arquivo .dgn criado possui características “selecionáveis”. Com esta opção no MicroStation, quando se clica perto de uma característica, o cursor salta para a sua posição exata.

Unidade de resolução

Insira a unidade de resolução para posições GPS no arquivo de saída. Se desejar sobrepor os dados GPS com dados existentes no formato .dgn, é importante que as unidades da resolução sejam as mesmas.

As duas opções são:

  Automático - As unidades da resolução são calculadas automaticamente a partir do campo Casas decimais da coordenada na guia Arquivo / Propriedades do projeto / Unidades e Formato do projeto Trimble Geomatics Office.

  Definido pelo usuário - As unidades de resolução podem ser especificadas manualmente neste campo.

Origem global

Selecione como a origem global é calculada. Se desejar sobrepor os dados GPS com dados existentes no formato .dgn, é importante que a origem global de ambos arquivos seja a mesma.

As duas opções são:

  Automático - A origem global é calculada automaticamente partir do arquivo de entrada (ou arquivos).

  Definido pelo usuário - As coordenadas X, Y e Z da origem global podem ser especificadas manualmente neste campo.


Diálogo Opções de Exportar (Exportar GIS)

Use este diálogo para editar as opções para o formato do Sistema de Informações Geográficas (GIS), para o qual se está exportando.

Para acessar este diálogo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia GIS, clique Opções.

NOTA: As opções disponíveis neste diálogo dependem do formato de exportação que escolheu. Estas configurações são descritas nos tópicos do formato apropriado:

  Arquivos Arcview (*.dbf, *.shp, *.shx)

  Arquivo AutoCAD com atributos (*.dxf)

  Arquivos MapInfo (*.mif, *.mid)

  Arquivo Microstation (*.dgn)

Além das configurações dependentes de formato, as configurações comuns a todos formatos são discutidas abaixo.

Formato de arquivo

São três formatos diferentes:

  Formato DOS

Selecione esta opção se o sistema do destino é executado sob o MS-DOS ou contém texto do grupo de caracteres ASCII do MS-DOS. Arquivos de texto neste formato possuem as marcas de fim de registro <Retorno de carro> <Nova linha>.

  Formato do Windows

Selecione esta opção se o sistema de destino for executado num ambiente do sistema operacional do Microsoft Windows ou se contém texto do grupo de caracteres ANSII. Arquivos de texto neste formato possuem marcas de fim de registro <Retorno de carro> <Nova linha>.

  Formato UNIX

Selecione esta opção se o sistema de destino for executado num ambiente do sistema operacional do UNIX. Arquivos de texto neste formato possuem marcas de fim de registro <Nova linha>.

NOTA: Somente os formatos de arquivo válidos para o formato de GIS selecionado são disponíveis.

Dimensões

Se o formato de GIS suportar pontos tridimensionais (3D), pode-se exportar pontos bidimensionais (2D) (Norte, Leste) ou pontos tridimensionais (Norte, Leste, Elevação). Esta opção não é disponível se o formato GIS não suportar pontos 3D.

SUGESTÃO: Se o GIS não suportar pontos 3D, para exportar elevações, clique em Atributos e selecione a opção Elevação do ponto.

Atributos

Clique Atributos para selecionar os atributos gerados que desejar exportar com os pontos. Abre-se o diálogo Atributos. Use este diálogo para configurar como deseja exportar os valores de atributo do menu.

NOTA: As opções disponíveis no diálogo Atributos são as mesmas em todos formatos GIS.


Diálogo Atributos (Opções de Exportar GIS)

Use este diálogo para selecionar qualquer outro valor de atributo que queira que o Trimble Geomatics Office inclua na exportação do arquivo. Os atributos são criados com o uso dos valores apropriados armazenados com pontos no banco de dados. Neste diálogo não pode-se criar seus próprios atributos para adicionar.

As opções disponíveis no diálogo Atributos são as mesmas de todos formatos do Sistema de Informações Geográficas (GIS).

Atributos gerados

Selecione qualquer combinação destas opções para adicionar em cada ponto exportado. Isso é útil se estiver exportando para um GIS 2D e desejar exportar as elevações. No software GIS para o qual está exportando, todos atributos gerados aparecem como atributos normais.

NOTA: Atributos de data e horário gerados são exportados no formato mais recente usado na biblioteca de características e atributos.

Exportar Menu de Atributos Como

Quando se define uma Biblioteca de características e atributos (*.fcl) ou um arquivo do Dicionário de Dados (*.ddf), pode-se especificar até dois valores de código para cada item de atributo do menu.

Por exemplo, considere um código de característica ‘Árvore’, com um atributo de menu ‘Tipo’. Todo item de menu pode ter valores de código. O tipo ‘Nativo’ pode ter valores de código de NV e NT. Pontos com um código de característica Árvore com atributos coletados podem ter seus atributos de tipo exportados como o valor atual do atributo (por exemplo, Nativo), ‘Código do usuário 1’ (por exemplo, NV), ou ‘Código do usuário 2’ (por exemplo, NT). Isso é útil se o seu GIS somente suportar valores de atributo de dois caracteres.

Para maiores informações sobre valores de código, consulte a Ajuda da utilidade Trimble Feature and Attibute Editor.


Comando Tópicos de Ajuda

Use o comando Tópicos de Ajuda para abrir a Ajuda on line.


Comando Sugestão do dia

O sistema de Sugestão do dia fornece sugestões para ajudá-lo usar o software Trimble Geomatics Office.

Escolha este comando para apresentar a próxima sugestão do dia.

Para apresentar sugestões quando se inicia o software Trimble Geomatics Office, selecione o quadro de verificação Mostrar Sugestões ao Iniciar.


Diálogo Sugestão do dia

O sistema Sugestão do dia fornece sugestões para ajudá-lo usar o software Trimble Geomatics Office.

Para visualizar sugestões quando se inicia o software Trimble Geomatics Office, selecione o quadro de verificação Mostrar Sugestões ao Iniciar.


Comando Sobre o Trimble Geomatics Office

Como ...

Use este comando para apresentar programa, informações sobre direitos autorais e o número da versão do software Trimble Geomatics Office.


Diálogo Sobre o Trimble Geomatics Office

Este diálogo apresenta programa, programa, informações sobre direitos autorais e o número da versão do software Trimble Geomatics Office.


Utilizando a Ajuda

Existem vários modos de obter ajuda quando se usa o software Trimble Geomatics Office.

Para obter Ajuda num diálogo	Tenha certeza de que o diálogo está ativo e pressione F1.
Para obter Ajuda sobre um comando de menu	1. Coloque o cursor sobre o comando de menu e mantenha apertado o botão esquerdo do mouse. 2. Pressione F1.
Para encontrar um tópico no sistema de Ajuda usando o Conteúdo	Selecione a etiqueta Conteúdo para buscar entre os tópicos, por categoria, como num livro.
Para encontrar um tópico no sistema de Ajuda usando o Índice	Selecione a etiqueta Índice para ver uma lista de entradas do índice. Digite a palavra que estiver procurando ou passe através da lista.
Para buscar um termo ou frase no sistema de Ajuda	1. Selecione a etiqueta Procurar. 2. Pode aparecer o assistente de Configuração do Localizar. Se aparecer, selecione a opção do tamanho Minimizar do banco de dados e clique Próximo >, e então clique Terminar. 3. No campo Digite as palavras que deseja encontrar, insira a palavra ou frase que deseja encontrar. 4. Se necessário, no campo Selecione palavras iguais para reduzir a busca, selecione uma palavra para reduzir a busca. 5. No campo Escolha tópico para apresentar, selecione um tópico. Ele será apresentado no lado direito da janela Ajuda. SUGESTÃO: Para reconstruir o índice, selecione Procura / Opções.
Para imprimir um tópico da Ajuda	Para imprimir o tópico atual de Ajuda, faça um dentre o seguinte:  Clique Imprimir.  No menu Arquivo, escolha Tópico.  Use o mouse direito para clicar dentro da janela Ajuda e então escolha Imprimir Tópico. NOTA: Pode-se imprimir tópicos individuais sobre a Ajuda mas não livros de Ajuda.  Para imprimir informações numa janela que aparece, use o botão direito do mouse para clicar dentro dela e em seguida clique Imprimir Tópico.
SUGESTÃO: Clique Voltar na barra de menu Ajuda para visualizar tópicos que já foram visualizados.


Para apresentar relatórios de registro de notas

Perspectiva Geral e Mais informações
Para apresentar relatórios do banco de dados do projeto do Trimble Geomatics Office, crie um relatório personalizado do banco de dados. Relatórios personalizados funcionam nos tipos primários de registro ou Perguntas definidas no banco de dados.

Existem duas maneiras de criar um relatório personalizado:

  Definindo o grupo de seleção

  Criando um formato de relatório


Definindo o grupo de seleção

Para selecionar tipos de registro não gráficos (por exemplo, registros de Notas):

1.	Escolha uma das seguintes opções:

  Use o grupo de seleção do arquivo .dc.

  Escolha Selecionar / Por pergunta.

2.	Selecione os tipos de registro.

NOTA: Se selecionar Todo o banco de dados, o relatório inclui todas as notas do banco de dados.


Criando um formato de relatório

Para fazê-lo:

1.	Selecione Relatórios / Relatórios adicionais. Aparece o diálogo Relatórios adicionais. A lista de Relatórios exibe uma lista dos relatórios atualmente disponíveis.

2.	Clique Novo para criar um novo formato de relatório. Aparece o diálogo Definir Formato do Relatório.

3.	No campo Nome, insira um nome para o relatório.

4.	No campo Relatório sobre, selecione registros de Nota.

5.	No campo Formatar corpo, escolha uma das seguintes opções:

  Insira [Nota].

  Use menu de atalho e selecione Nota.

O visualizador padrão de HTML abre-se e exibe o relatório. Pode-se imprimir ou salvar o relatório.


Apresentando relatórios de registros de nota (coletados no campo) com informações de ponto

Registros de nota não estão diretamente relacionados a pontos do Trimble Geomatics Office. Portanto, não pode-se exportar diretamente registros de nota e informações de pontos (por exemplo, N, E, notas) usando o processo especificado acima. No entanto, pode-se exportar notas através do campo de código da característica.

Para fazê-lo:

1.	Usando a utilidade DC Editor, encontre no arquivo .dc os Registros de Vetor GPS (GPS VEC) seguidos de uma nota.

2.	Nestes campos de Registro de Vetor GPS, vá ao campo CÓDIGO e digite um travessão depois do código atual, seguido das informações da Nota. Por exemplo, ÁRVORE – Pinheiro.

Quando o registro é importado, o registro de nota é adicionado ao fim do campo do código da característica. A nota é então associada a um ponto e pode-se apresentar um relatório de:

  Ponto, Norte, Leste, Código de característica

NOTA: Algumas vezes o campo Registro de Vetor GPS é seguido de um carimbo de data/hora e de um registro de nota. Neste caso, o carimbo de data/hora é associado ao código de característica ao invés de ponto. Lhe será necessário apagar o registro do carimbo data/hora.


Para criar um relatório personalizado de ponto

Perspectiva geral e Mais informações
Para apresentar um relatório de registros de ponto do banco de dados do Trimble Geomatics Office, crie um relatório personalizado do banco de dados. Relatórios personalizados funcionam nos tipos primários de registro ou Perguntas definidas no banco de dados.


Criação de um relatório personalizado do banco de dados

1.	Selecione Relatórios / Relatórios adicionais. Aparece o diálogo Relatórios adicionais. A lista de Relatórios exibe uma lista dos relatórios atualmente disponíveis.

2.	Clique Novo para criar o novo formato de relatório. Aparece o diálogo Definir Formato de Relatório.

3.	No campo Nome, insira um nome para o relatório. Por padrão, aparece Registros de ponto no campo Relatório.

4.	Clique Preencher Formato Automaticamente e o Trimble Geomatics Office software preenche os campos Formatar cabeçalho e Formatar corpo. Estes formatos podem ser editados.

SUGESTÃO: Clique o lado direito do mouse nos campos Formatar cabeçalho e Formatar campo, selecione Campos e selecione os códigos de campo disponíveis na lista.

6.	Clique OK.

O visualizador HTML padrão abre-se e exibe o relatório. Pode-se imprimir ou salvar o relatório.


Para mudar a zona na projeção do projeto

 Perspectiva geral e Mais informações

NOTA: A zona deve estar no banco de dados do sistema de coordenadas.

1.	Selecione Arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do Projeto.

2.	Selecione a guia Sistema de coordenadas.

3.	No grupo Configurações do sistema de coordenadas, clique Mudar. Aparece o diálogo Selecionar sistema de coordenadas.

4.	Selecione a opção Novo sistema e clique Próximo. Aparece o diálogo Selecionar tipo de sistema de coordenadas.

5.	Selecione a opção Sistema de coordenadas e Zona e clique Próximo.

6.	No grupo Zona do sistema de coordenadas, realce o sistema de coordenadas que contém a zona requerida.

7.	No grupo da Zona, selecione a zona requerida e clique Próximo. Aparece o diálogo Selecionar modelo geóide.

8.	Escolha uma das seguintes opções:

  Selecione o modelo geóide requerido para o projeto.

  Clique Sem modelo geóide.

9.	Clique Concluir.

O sistema de coordenadas é aplicado ao banco de dados. Todos pontos existentes no banco de dados são convertidos para o novo sistema de coordenadas.

Se contar com posições de pontos ou inserir coordenadas com elevações nulas no projeto e uma elevação de projeto não for definida, a seleção do sistema de coordenadas falha. Isso porque o Trimble Geomatics Office não pode converter pontos existentes de um sistema para outro sem uma elevação aproximada.


Para exportar um Arquivo de Mapa de Fundo para o Trimble Survey Controller

 Perspectiva Geral e Mais informações

1.	Escolha uma das seguintes opções:

  Selecione Arquivo / Exportar.

  Clique a ferramenta Exportar.

Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção Biblioteca Características e Atributos para o Survey Controller (*.fcl). Aparece o diálogo Selecionar Biblioteca de Características e Atributos.

3.	Clique Procurar para encontrar o arquivo .fcl que deseja exportar.

4.	Marque a caixa de seleção Exportar atributos para exportar definições de atributos contidas na biblioteca de características e atributos. Esta opção torna disponíveis os atributos no Trimble Survey Controller. Se a caixa de seleção for desmarcada, todos atributos definidos no arquivo .fcl não serão exportados.

NOTA: Códigos de controle também são exportados.

5.	Clique OK. Aparece o diálogo Transferência de dados Salvar como.

6.	Verifique se o dispositivo (que executa o Trimble Survey Controller) está conectado ao computador.

7.	Selecione um dispositivo do Survey Controller e clique Abrir. Aparece o diálogo Conectando.

Quando a conexão é estabelecida, aparece o diálogo Salvar.

8.	Escolha uma das seguintes opções:

  Selecione a opção Memória Principal (C:) para armazenar a biblioteca na memória principal do Trimble Survey Controller.

  Selecione a opção PC card (A:) se tiver instalado um cartão PC card e desejar armazenar a biblioteca no PC card.

NOTA: Se o seu dispositivo não tiver um PC Card, este diálogo não será disponível.

9.	Clique Abrir. O local selecionado será lido. Todos arquivos da biblioteca de características e atributos da pasta são apresentados. O nome interno da biblioteca de características e atributos aparece no campo Nome do arquivo.

10.	Edite o campo Nome do arquivo para mudar o nome do arquivo no Trimble Survey Controller, se necessário. O nome do arquivo original no computador não muda.

11.	Clique Salvar. Aparece o diálogo Carregando. A barra de progresso exibe o progresso da transferência.

Quando a transferência é concluída, o diálogo Carregando desaparece e a conexão ao dispositivo é interrompida.

A biblioteca foi transferida.


Para exportar para um formato GIS

Perspectiva geral e Mais informações
1.	Escolha uma das seguintes opções:

  Selecione Arquivo / Exportar.

  Clique a ferramenta Exportar na barra de ferramentas Padrão.

Aparece o diálogo Exportar principal.

2.	Na guia GIS, selecione o formato requerido.

3.	Para mudar as opções de configurações para os formatos de exportação, clique Opções. Isso lhe permite configurar as opções apropriadas para o formato GIS, ao qual está exportando.

4.	Clique OK. Aparece o diálogo Nome do arquivo.

5.	Especifique um nome para o novo arquivo e clique Salvar para criar o novo arquivo (ou arquivos).


Para criar um arquivo Combinado grid do datum (.cdg) para transferir para o Trimble Survey Controller

 Perspectiva Geral e Mais informações

NOTA: Para criar um novo grid do datum combinado, somente pode-se usar o arquivo do grid do datum atualmente usado no projeto. No entanto, pode-se exportar qualquer grid do datum combinado. Somente pode-se transferir um arquivo combinado grid do datum para a versão 7.00 ou mais recente do Trimble Survey Controller.

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção Grid do datum para o Survey Controller (*.cdg) e clique OK. Aparece o diálogo Exportar um Grid do Datum.

3.	Selecione a opção Criar um arquivo Grid do Datum Combinado para exportar para o Survey Controller. Aparece o diálogo Criar Arquivo Combinado do Grid do Datum.

A caixa amarela do globo define a área coberta pelos arquivos de grid de latitude e longitude. Elas são especificados no lado direito do diálogo Criara Grid do Datum Combinado.

4.	Para diminuir o tamanho do arquivo, use a ferramenta Selecionar do lado esquerdo do diálogo Criar Grid do Datum Combinado. Arraste a caixa de seleção preta sobre a área dentro da caixa amarela na qual deseja criar o grid do datum combinado.

O tamanho do arquivo mostra o tamanho e os limites de Latitude e Longitude mostram a extensão do arquivo do grid do datum combinado que será criado.

5.	O campo do nome Survey Controller apresenta o nome do grid do datum combinado com grid subdividido usado no trabalho do Trimble Survey Controller. Adicione um sufixo ou prefixo ao nome se o Trimble Survey Controller já usa um grid de datum do mesmo nome. O nome deve conter o nome do grid de datum original.

NOTA: Durante a importação do arquivo Survey Controller (*.dc), o Trimble Geomatics Office usa o nome do Survey Controller para verificar se o nome do arquivo .cdg usado no campo condiz com o grid do datum definido para o projeto do Trimble Geomatics Office. Se o nome não incorporar ao nome do grid do datum original, o grid do datum não será reconhecido.

6.	Clique OK.

Aparece o diálogo Nome do arquivo. O nome padrão do arquivo consiste dos primeiros seis caracteres do nome do grid do datum. Este não é o nome usado no Trimble Survey Controller – é o nome do arquivo .cdg que deve ser armazenado na pasta Arquivos do Programa\Arquivos Comuns\Trimble\GeoData.

7.	Para especificar um nome alternativo para o arquivo, use o teclado para editar o campo Nome do arquivo e clique Salvar. Aparece o diálogo Transferência de Dados Salvar como.

8.	Selecione um dispositivo do Survey Controller e clique Abrir. Aparece o diálogo Conectando. Quando a conexão é efetuada, aparece o diálogo Salvar.

9.	Escolha uma das seguintes opções:

  Selecione a opção Memória Principal (C:) para armazenar o arquivo na memória principal do Trimble Survey Controller.

  Selecione a opção PC card (A:) se tiver instalado um PC card e desejar armazenar o arquivo no PC card.

NOTA: Se o dispositivo da Trimble não contar com um PC Card, este diálogo não é disponível.

10.	Clique Abrir.

A pasta selecionada é lida. Todos arquivos combinados do grid do datum da pasta são exibidos. O campo Nome do arquivo não é disponível. Ele exibe o nome do grid do datum combinado que aparece no Trimble Survey Controller.

11.	Clique Salvar. Aparece o diálogo Carregando e a barra de progresso exibe o progresso da transferência. Quando a transferência é completada, o diálogo Carregando desaparece e a conexão ao dispositivo é interrompida.

Agora pode-se usar o arquivo do Trimble Survey Controller.


Para subdividir o grid e transferir um arquivo Grid do Geóide (.ggf) para o Trimble Survey Office

 Perspectiva Geral e Mais informações

NOTA: Somente pode-se transferir um arquivo do Grid do Geóide para uma versão 6.00 ou mais atual do Trimble Survey Controller.

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção Arquivo Geóide para Survey Controller (*.ggf) e clique OK. Aparece o diálogo Exportar um Modelo Geóide.

3.	Para criar um novo arquivo do Grid do Geóide, selecione a opção Criar um sub-grid de um modelo Geóide para exportar para o Survey Controller e clique OK. Aparece o diálogo Criar Grid do Geóide.

NOTA: Escolha a opção Exportar modelo existente de geóide para o Survey Controller para exportar o arquivo existente deste tipo.

A caixa amarela do globo define a área coberta pelo modelo geóide. O modelo geóide e o arquivo Grid do Geóide são especificados no lado direito do diálogo Criar Grid do Geóide. Se o modelo do geóide cobrir todo o mundo, uma caixa amarela não será visível.

4.	Para diminuir o tamanho do arquivo, use a ferramenta Selecionar do lado esquerdo do diálogo Criar Arquivo do Grid do Geóide. Arraste a caixa de seleção preta sobre a área dentro da caixa amarela na qual queira criar o arquivo do grid do geóide.

O tamanho do arquivo mostra o tamanho e os limites da Latitude e Longitude mostram as extensões do arquivo do grid do geóide que será criado.

5.	O campo Nome mostra o nome do modelo geóide com grid subdividido usado no trabalho do Trimble Survey Controller. Se o Survey Controller já estiver usando um modelo geóide com o mesmo nome, adicione um prefixo ou sufixo ao nome. Ele deve conter o nome do modelo original do geóide.

NOTA: Durante a importação do arquivo Survey Controller (*.dc), o Trimble Geomatics Office usa o campo do nome para verificar se o nome do arquivo .ggf usado no campo combina com o modelo geóide definido para o projeto do Trimble Geomatics Office. Certifique-se de que o nome do arquivo contém o nome original do modelo geóide, o modelo geóide não será reconhecido.

6.	Clique OK.

Aparece o diálogo Salvar como. O nome padrão de arquivo consiste nos primeiros seis caracteres do nome do modelo geóide. Este não é o nome usado no Trimble Survey Controller. É o nome do arquivo de grid do geóide que será armazenado na pasta Arquivos do Programa\Arquivos Comuns\Trimble\GeoData.

7.	Para especificar um nome alternativo para o arquivo, use o teclado para editar o campo Nome do arquivo e clique Salvar. Aparece o diálogo Transferência de Dados Salvar como.

8.	Selecione um dispositivo do Survey Controller e clique Abrir. Aparece o diálogo Conectando. Quando a conexão é efetuada, aparece o diálogo Salvar.

9.	Escolha uma das seguintes opções:

  Selecione a opção Memória Principal (C:) para armazenar o arquivo na memória principal do Trimble Survey Controller.

  Selecione a opção PC card (A:) se tiver instalado um PC card e desejar armazenar o arquivo no PC card.

NOTA: Se o dispositivo da Trimble não contar com um PC Card, este diálogo não será disponível.

10.	Clique Abrir.

A pasta selecionada é lida. Todos arquivos de grid do geóide da pasta serão exibidos.  O campo Nome do arquivo exibe o nome do grid do geóide que aparece no Survey Controller. Este nome é usado para condizer com o nome do grid do geóide quando se transfere um arquivo .dc usando este arquivo para o Trimble Geomatics Office.

11.	Clique Salvar. Aparece o diálogo Enviando. A barra de progresso exibe o progresso da transferência. Quando a transferência estiver concluída, o diálogo Enviando desaparece e a conexão ao dispositivo é interrompida.

Agora pode-se usar o arquivo no Trimble Survey Controller.

NOTA: Também pode-se usar a utilidade Trimble Grid Factory™ para subdividir o grid dos arquivos do modelo do geóide. O Grid Factory é parte da opção personalizada do Trimble Geomatics Office na instalação do software.

NOTA: Se estiver transferindo dados para ou de uma versão 7.60 do Trimble Survey Controller, use o formato de arquivo .dc da versão 7.50..


Para subdividir o grid e transferir um arquivo de Grid do Geóide (.ggf) para o Software TDS Survey Pro CE

 Perspectiva Geral e Mais Informações

NOTA: Somente pode-se transferir um arquivo do Grid do Geóide para a versão 4 ou mais recente do software TDS Survey Pro CE.

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção Arquivos de Geóide para TDS Survey Pro CE (*.ggf) e clique OK. Aparece o diálogo Exportar um Modelo Geóide.

3.	Para criar um novo arquivo de Grid do Geóide, selecione a opção Criar um sub-grid de um modelo Geóide para Exportar e clique OK. Aparece o diálogo Criar Arquivo do Grid do Geóide.

NOTA: Escolha a opção Exportar arquivo de grid de geóide existente para exportar um arquivo existente deste tipo.

A caixa amarela do globo define a área coberta pelo modelo geóide. O modelo geóide e o arquivo Grid do Geóide são especificados no lado direito do diálogo Criar Arquivo do Grid de Geóide. Se o modelo geóide cobrir o mundo todo, uma caixa amarela não será visível.

4,	Para diminuir o tamanho do arquivo, use a ferramenta Selecionar à esquerda do diálogo Criar Arquivo de Grid do Geóide. Arraste a caixa de seleção preta sobre a área dentro da caixa amarela para a qual queira criar o arquivo de grid do geóide.

O tamanho do arquivo mostra o tamanho e os limites da Latitude e Longitude mostram as extensões do arquivo de grid do geóide que será criado.

A campo Nome mostra o nome do modelo de geóide com grid subdividido usado.

NOTA: Durante a importação do arquivo, o Trimble Geomatics Office usa o campo Nome para verificar se o nome do arquivo .ggf usado no campo condiz com o modelo geóide definido para o projeto do Trimble Geomatics Office. Certifique-se de que o nome de arquivo contém o nome do modelo geóide original ou o modelo geóide não será reconhecido.

6.	Clique OK.

Aparece o diálogo Salvar como. O nome padrão de arquivo são os primeiros seis caracteres do nome do modelo geóide. Será o nome do arquivo de grid do geóide que será armazenado no diretório Arquivos do Programa\Arquivos Comuns\Trimble\GeoData.

7.	Para especificar um nome alternativo para o arquivo, use o teclado para editar o campo Nome do arquivo e clique Salvar. Aparece o diálogo Transferência de dados Salvar como.

8.	Selecione o dispositivo TDS Survey Pro CE e clique Abrir. Aparece o diálogo Conexão. Quando a conexão é feita, aparece o diálogo Salvar.

9.	Transfira o arquivo para o dispositivo TDS Survey Pro CE.

Agora pode-se usar o arquivo no software TDS Survey Pro CE.

NOTA: Também pode-se usar a utilidade Grid Factory para subdividir grid arquivos do modelo geóide. Grid Factory faz parte da opção Personalizar o Trimble Geomatics Office na instalação do software.


To use data from the TRIMMAP Software
Para usar dados do software TRIMMAP

Pode-se importar dados de tabalhos criados com o software TRIMMAP para o Trimble Geomatics Office.

1.	No software TRIMMAP, abra o trabalho que deseja processar com o Trimble Geomatics Office.

2.	Selecione Ferramentas / Importar/Exportar / Interfaces Gráficas. Aparece o menu Interfaces Gráficas.

3.	Selecione Interfaces Gráficas / Criar arquivo.

4.	Insira um nome de trabalho e um Nome de arquivo de saída.

NOTA: No campo Nome de arquivo de saída, certifique-se de que especificou o nome e o local do arquivo que será criado e deu a extensão .tgf. Por exemplo, C:\Temp\Topo_pts.tgf

5.	No Trimble Geomatics Office, selecione Arquivo / Importar. Aparece o diálogo Importar.

6.	Na guia CAD / ASCII, selecione a opção do arquivo de gráficos do TRIMMAP e clique OK. Aparece o diálogo Selecionar arquivos.

7.	Navegue para a pasta que contém o arquivo .tgf e clique Abrir.

O arquivo é importado para o Trimble Geomatics Office.


Para criar uma nova pergunta

AVISO: A Trimble Navigation Limited suporta o uso ou a modificação deste banco de dados somente através do Trimble Geomatics Office de propriedade da Trimble. A Trimble não suporta ou autoriza o uso ou modificação, ou garantia de desempenho deste banco de dados por meios de outras aplicações de software. A Trimble pode, a qualquer momento, modificar o formato deste banco de dados, tornando-o incompatível com outras aplicações de software.

 Perspectiva geral e Mais informações

NOTA: Para definir as perguntas personalizadas, requer-se um software Microsoft Access 2000 (ou mais recente).

Este exemplo cria uma pergunta que seleciona todos pontos do banco de dados com valores de elevação de zero.

1.	No Microsoft Access, abra o banco de dados do modelo (ou projeto) do Trimble Geomatics Office no qual deve-se adicionar a pergunta. Isso encontra-se na pasta do modelo ou projeto (.mdb).

2.	Selecione a guia Perguntas na janela principal de gráficos e clique Novo para criar uma nova pergunta.

SUGESTÃO: Escolha a opção de Visualização do desenho ao invés da opção Assistente da pergunta.

3.	No diálogo Mostrar tabela, selecione a Tabela de pontos, desde que quer-se selecionar entidades de ponto e eles estão todos armazenados nesta tabela.

4.	Clique Adicionar antes de fechar este diálogo.

Aparece um diálogo de pergunta.

5.	Configura e primeira coluna da definição da pergunta para toda a Tabela de pontos. Isso pode ser feito seja arrastando e soltando o identificador * da Tabela de pontos na seção superior do diálogo da pergunta ou selecionando Ponto.* na caixa Campo.

NOTA: A caixa de seleção Mostrar está marcada por padrão. A não ser que múltiplas entidades devam ser selecionadas pela pergunta, geralmente prefere-se devolver a tabela completa. Desta maneira, a pergunta pode ser usada para outros fins (tal como apresentação de um relatório).

6.	Configure as especificações do Campo na segunda coluna para Elevação (o identificador do campo elevação).

Digite =0 no campo Critérios, nesta coluna. Isto configura a verificação para valores de elevação zero.

7.	Para testar a funcionalidade desta pergunta, marque a visualização da Folha de dados. Todos pontos do banco de dados com altura zero aparecem na tabela.

8.	Para salvar a nova pergunta, feche-a e dê um nome com o prefixo “Selecionar_”. Por exemplo, dê o nome de “Selecionar_Pontos com elevações zero”.

NOTA: Para adicionar uma pergunta às ferramentas de seleção da janela Propriedades, use o prefixo “ClassificarSS_” para a ferramenta Classificar, “SvyFiltroSS_” para a ferramenta Filtro (para dados de levantamento) e “PlanoFiltroSS_” para a ferramenta Filtro (para dados CAD). Para usar a pergunta para um relatório personalizado, use o prefixo “Relatório_”.

9.	Antes que a nova pergunta torne-se disponível em Selecionar / Por pergunta (e em outros lugares do Trimble Geomatics Office) o arquivo de esquema do banco de dados deve ser atualizado. Use o Microsoft Windows Explorer para apagar o arquivo de esquema do banco de dados (.dbs) para o projeto (ou o projeto do modelo).

NOTA: Quando um projeto sem um arquivo de esquema do banco de dados está aberto, o Trimble Geomatics Office cria, automaticamente, um novo arquivo de esquema, baseado na configuração do arquivo do banco de dados. Este novo arquivo do  esquema contém referências para a pergunta apenas adicionada. A nova pergunta aparece em Selecionar / Por pergunta. Pode-se usá-la nas definições personalizadas de relatório e exportação de ASCII.

10.	Abra o Trimble Geomatics Office e abra o modelo ou projeto ao qual a pergunta foi adicionada.

Agora pode-se usar a nova pergunta escolhendo Selecionar / Por pergunta. A nova pergunta aparece na lista.


Para importar um arquivo do Survey Controller (*.dc) do Trimble Survey Controller

 Perspectiva Geral e Mais informações

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione a opção dispositivos do Survey Controller e clique OK. Aparece o diálogo Transferência de dados aberta.

3.	Selecione um dispositivo do Survey Controller e clique Abrir. Aparece o diálogo Conectando.

Quando a conexão é efetuada, o campo Ver em do diálogo Abrir mudar para o dispositivo do Survey Controller.

4.	Escolha uma das seguintes opções:

  Selecione a opção Memória Principal (C:) se o arquivo que estiver importando está na memória do Trimble Survey Controller.

  Selecione a opção PC card (A:) se tiver instalado um PC card e desejar importar o arquivo que está no PC card.

NOTA: Se o dispositivo da Trimble não contar com um PC Card, este diálogo não é disponível.

5.	Clique Abrir. A pasta selecionada é lida. Todos trabalhos do Trimble Survey Controller da pasta são exibidos.

6.	No campo Formato do arquivo, selecione a versão do arquivo do Coletor de dados que está usando.

7.	Selecione os arquivos que desejar importar e clique Abrir. Aparece o diálogo Fazendo o download e a barra de progresso mostra o progresso da transferência de arquivos. Quando a transferência é concluída, o diálogo Fazendo o download desaparece e a conexão com o dispositivo é interrompida.

O arquivo do trabalho foi convertido para um arquivo .dc e é importado para o banco de dados do projeto. O arquivo .dc está localizado na pasta Arquivos de dados\Arquivos da Trimble do projeto.

NOTA: Ao transferir um arquivo .dc para o Trimble Geomatics Office de um dispositivo que execute o Trimble Survey Controller, ele é importado automaticamente para o projeto.

NOTA: Se você estiver transferindo dados para ou de uma versão 7.60 do software Survey Controller, use o formato do arquivo .dc da versão 7.50.


Para importar um arquivo de dados GPS da Trimble (.dat) do seu computador

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione a opção de arquivo dados GPS (*.dat)e clique OK. Aparece o diálogo Abrir.

3.	Localize o arquivo .dat que deseje importar e clique Abrir. Aparece o diálogo DAT Checkin.

4.	Faça as mudanças necessárias.

Em particular, verifique se os valores de altura da antena estão corretos. A mudança dos valores não muda os valores atuais no arquivo .dat. Somente muda os valores usados para importar o arquivo no Trimble Geomatics Office. Isso mantém o arquivo .dat no seu estado original.

5.	Clique OK.

O arquivo importado é localizado na pasta Arquivos de dados\Arquivos da Trimble do projeto.

SUGESTÃO: Pode-se arrastar e soltar the file.


Para importar um arquivo de dados GPS (.dat) da Trimble de um receptor GPS da Trimble

Perspectiva Geral e Mais informações
1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione a opção dispositivos do Survey Controller e clique OK. Aparece o diálogo Transferência de dados aberta.

3.	Selecione um Dispositivo do receptor GPS e clique Abrir. Aparece o diálogo Conectando.

Quando a conexão é feita, o campo Ver em do diálogo Abrir muda para o Dispositivo do receptor GPS.

4.	Selecione os arquivos que quiser importar e clique Abrir. Aparece o diálogo Fazendo o download e a barra de progresso mostra o progresso da transferência do arquivo.

Quando a transferência estiver completada, o diálogo Fazendo o download desaparece e a conexão com o receptor GPS é interrompida.

Aparece o diálogo DAT Checkin.

5.	Faça as mudanças necessárias.

Em particular, verifique se os valores de altura da antena estão corretos. A mudança dos valores não muda os valores atuais no arquivo .dat. Somente muda os valores usados para importar o arquivo no Trimble Geomatics Office. Isso mantém o arquivo .dat no seu estado original.

6.	Clique OK.

O arquivo importado está localizado na pasta Arquivos de dados\Arquivos da Trimble do projeto.


Para importar um arquivo de dados GPS RINEX

Perspectiva Geral e Mais informações
1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione a opção de arquivos RINEX e clique OK. Aparece o diálogo Abrir.

Selecione os arquivos de observação que deseja importar. Mude a opção Arquivos do tipo, se necessário. Clique Abrir.

Se existir um arquivo .nav correspondente com o mesmo nome, ele será automaticamente conectado ao arquivo de observações.

Se o arquivo .nav correspondente não possuir o mesmo nome, aparece o diálogo Correspondendo arquivo de navegação. Arquivos de observação são especificados sob os arquivos de observação. Selecione o arquivo .nav apropriado e clique OK.

NOTA: Cada arquivo de observação deve possuir um arquivo .nav correspondente. Se o arquivo .nav correto não for selecionado, aparece uma mensagem sobre a importação e as linhas de base não poderão ser processadas.

4.	Os arquivos são convertidos para o formato de arquivo de dados GPS da Trimble. Aparece o diálogo DAT Checkin.

5.	Faça as mudanças necessárias.

Em particular, verifique se os valores de altura da antena estão corretos. A mudança dos valores não muda os valores atuais no arquivo .dat. Somente muda os valores usados para importar o arquivo no Trimble Geomatics Office. Isso mantém o arquivo .dat no seu estado original.

SUGESTÃO: Certifique-se de que o check-in do .dat do receptor e tipos de antenas não sejam desconhecido.

6.	Clique OK.

O arquivo importado está localizado na pasta Arquivos de Dados\Arquivos da Trimble do projeto.


Para criar um formato personalizado de Importar / Exportar

 Perspectiva Geral e Mais informações

Este exemplo define um formato de exportação personalizado. O formato é um arquivo de texto delimitado por vírgulas, contendo o nome do ponto (em letras maiúsculas), norte (com unidades), leste (com unidades) e elevação (com unidades). Códigos de campo são usados para selecionar os campos requeridos. Formatos personalizados para importação são definidos em maneira similar.

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Personalizar, clique Novo. Aparece o diálogo Definir Formato de Exportação ASCII.

3.	No campo Nome, insira um nome.

4.	Clique o lado direito do mouse no campo Formatar corpo e selecione Campos / Nome do menu de atalho.

[Nome] aparece na caixa Formatar corpo.

5.	Clique o lado direito do mouse e selecione Campos / Avançado / Modificadores do menu do atalho.

[Nome:Letras maiúsculas] aparece na caixa de Formatar corpo. Isso significa que todos nomes de ponto serão exportados em letras maiúsculas.

6.	Insira uma vírgula, seguida de um espaço.

7.	Clique o lado direito do mouse e selecione Campos / Norte no menu de atalho.

[Norte] aparece ao lado de uma vírgula.

8.	Clique o lado direito do mouse e selecione Campos / Avançado / Unidades do menu do atalho.

[Norte] muda para [Norte:unidades]. Isso significa que a unidade atual das coordenadas é incluída no arquivo.

9.	Insira uma vírgula, seguida de um espaço.

10.	Clique o lado direito e selecione Campos / Leste do menu de atalho.

[Leste] aparece ao lado da vírgula.

11.	Clique o lado direito do mouse e selecione Campos / Avançado / Modificadores / Unidades do menu de atalho.

[Leste] muda para [Leste:unidades]. Isso significa que a unidade atual das coordenadas é incluída no arquivo.

12.	Insira uma vírgula seguida de um espaço.

13.	Clique o lado direito do mouse e selecione Campos / Elevação do menu de atalho.

[Elevação] aparece ao lado da vírgula.

14.	Clique o lado direito do mouse e selecione Campos / Avançado / Modificadores / Unidades do menu de atalho.

[Elevação] muda para [Elevação:unidades]. Isso significa que a unidade atual das coordenadas é incluída no arquivo.

15.	Clique OK para salvar o formato de exportação. Aparece o diálogo Exportação. O formato criado aparece na lista da guia Personalizar.

16.	Para exportar dados neste formato, selecione o formato e clique OK. Aparece o diálogo Salvar como.

17.	No campo Nome do arquivo, insira um nome para o arquivo de exportação e clique Salvar para criar o arquivo.


Para exportar um arquivo do Survey Controller (*.dc) para o Trimble Survey Controller

Perspectiva Geral e Mais informações
1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção dispositivos do Survey Controller.

3.	Clique Opções para especificar as configurações do trabalho para o arquivo.

4.	No diálogo que aparece, clique OK para aceitar qualquer mudança e voltar ao diálogo Exportar.

5.	Clique OK. Aparece o diálogo Transferência de dados Salvar como.

6.	Selecione um dispositivo do Trimble Survey Controller e clique Abrir. Aparece o diálogo Conectando.

7.	Quando a conexão é estabelecida, aparece o diálogo Salvar.

8.	Escolha uma das seguintes opções:

  Sele a opção Memória Principal (C:) para armazenar o arquivo na memória principal do Trimble Survey Controller.

  Selecione a opção PC card (A:) se tiver instalado um PC card e desejar armazenar o arquivo no PC card.

NOTA: Se o dispositivo da Trimble não possuir um PC Card, este diálogo não será disponível.

9.	Clique Abrir.

O diretório selecionado é lido. Todos arquivos do Survey Controller da pasta são exibidos. O nome do projeto do Trimble Geomatics Office aparece no campo Nome do arquivo. Este é o nome do trabalho do Trimble Survey Controller que será exportado para o Trimble Survey Controller. Pode-se editar este nome, se necessário.

10.	Clique Salvar. Aparece o diálogo Carregando. A barra de progresso exibe o progresso da transferência. Quando a transferência estiver completada, o diálogo Carregando desaparece e a conexão ao dispositivo é interrompida.

Agora pode-se usar o arquivo no Trimble Survey Controller.

NOTA: Se estiver transferindo dados para ou de uma versão 7.60 do Survey Controller, use o formato de arquivo .dc da versão 7.50.


Para exportar arquivos AutoCAD (*.dxf)

 Perspectiva Geral e Mais informações

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia CAD / ASCII, selecione a opção AutoCAD (*.dxf).

3.	Clique Opções para configurar a versão e tipo do .dxf ao qual deseja exportar.

4.	Clique OK. Aparece o diálogo Salvar como.

5.	Navegue para a pasta na qual deseja salvar o arquivo.

6.	Digite o nome para o arquivo e clique Salvar.

O arquivo é criado.

Por padrão, o Trimble Geomatics Office exporta o nome do ponto como um atributo do ponto. Para exportar outras informações sobre o ponto, edite as definições do bloco de atributos DXF/DWG no arquivo Opções.ini.

NOTA: Pode-se usar estes passos para exportar um arquivo de desenho (*.dwg). No passo 4, clique Opções para configurar o formato e versão de .dwg.


Para mudar as unidades de um projeto

 Perspectiva Geral e Mais informações

1.	Selecione Arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Na guia Unidades e Formato, selecione o campo para o qual quer mudar as unidades de formato.

3.	Selecione a opção requerida da lista e clique OK para aplicar as mudanças.


Para configurar um projeto para atributos

 Perspectiva Geral e Mais informações

1.	Selecione Arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Na guia Características, marque a caixa de seleção Usar atributos. O campo Biblioteca torna-se disponível.

3.	Clique Procurar para localizar o arquivo Biblioteca de Características e Atributos (*.fcl) ou arquivo Dicionário de Dados (*.ddf) que requer.

4.	Clique OK. O arquivo selecionado é usado para criar tabelas de banco de dados para cada código de característica com atributos. Agora pode-se importar os arquivos .dc com atributos.


Para selecionar um local salvado como um sistema de coordenada de projetos

Perspectiva Geral e Mais informações
1.	Selecione Arquivo / Propriedades do Projeto. Aparece o diálogo Propriedades do Projeto.

2.	Selecione a guia Sistema de Coordenadas.

3.	No grupo Configurações dos Sistemas de Coordenadas, clique Mudar. Aparece o diálogo Selecionar Sistema de Coordenadas.

4.	Selecione Novo sistema e clique Próximo. Aparece o diálogo Selecionar tipo de sistema de coordenadas.

5.	Selecione Local calibrado e clique Próximo. Aparece o diálogo Selecionar local calibrado.

6.	Selecione o local requerido e clique Concluir.

O sistema de coordenadas é aplicado ao banco de dados. Todos pontos existentes no banco de dados são convertidos para o novo sistema de coordenadas. Para informações sobre o processo de conversão, consulte o tópico Sistemas de Coordenadas – Perspectiva geral.

Se contar com posições de pontos ou inserir coordenadas com elevações nulas no projeto e uma elevação padrão não for definida, a seleção do sistema de coordenadas falhará porque o Trimble Geomatics Office não pode converter pontos existentes de um sistema para outro.


Para exportar atributos

 Perspectiva Geral e Mais informações

Pode-se exportar um arquivo que contenha:

  todos pontos com uma característica específica

  todos atributos

Para exportar arquivos separados para cada característica:

1.	Selecione pontos que contêm a característica de interesse.

2.	Configure um formato de exportação personalizado.


Seleção de pontos que contêm a característica de interesse

Para fazê-lo:

1.	Na Visualização do plano, escolha Selecionar / Por característica ponto.

Por exemplo, se desejar apresentar um relatório sobre todos três atributos,selecione "árvore" no diálogo Selecionar por característica ponto.

2.	Clique OK. Todos pontos com o código de característica especificado serão selecionados.


Configuring the custom report format
Configurando um formato de relatório personalizado

Para fazê-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Personalizar, clique Novo. Aparece o diálogo Definir Formato de Exportação ASCII.

3.	No campo Nome, insira um nome para o formato exportar.

4.	No campo Descrição, insira uma descrição do formato de exportação. Uma descrição não é obrigatória para o formato.

5.	Certifique-se de que as Informações do ponto estejam selecionadas no campo Exportar de . Isso porque se está apresentando um relatório sobre pontos.

6.	Clique Preencher Formato Automaticamente para preencher todos os campos da tabela de pontos para o cabeçalho do formato e corpo do formato.

7.	No diálogo Inserir formato que aparece, selecione os delimitadores apropriados requeridos para o formato.

8.	Apague todos cabeçalhos e campos que não quiser incluir no formato.

9.	Na lista Formatar cabeçalho, adicione todos cabeçalhos de atributo que quiser incluir no formato.

10.	Os registros de atributo não são armazenados na Tabela de pontos. Adicione os campos que devem ser incluídos no formato a partir da tabela apropriada da característica. Para acessar estes campos, clique o lado direito do mouse na lista Formatar corpo e faça a seleção do menu de atalho.

11.	Selecione Campos / Avançado / Atributos. Aparecem todos códigos de característica com atributos (na biblioteca de características e atributos usada para configurar o projeto para atributos).

12.	Escolha o mesmo código de características selecionado (por exemplo “’árvore”). Os atributos aparecem num outro sub-menu.

13.	Clique o atributo sobre o qual quer apresentar um relatório. O atributo selecionado aparece na caixa Formatar corpo.

NOTA: De desejar apresentar um relatório sobre todos atributos de uma determinada característica, no menu de atalho, selecione a opção asterisco (*). Todos os atributos são adicionados ao corpo do formato.

14.	Repita os passos acima para cada atributo que desejar exportar para um arquivo.

15.	Preencha o formato de exportação e clique OK. O formato é adicionado na lista Personalizar.

16.	Para exportar um arquivo neste formato, realce o formato e clique OK.


Para exportar um só arquivo com todos atributos

Para fazê-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia GIS, selecione a opção Nome, Latitude, Longitude, Altura, Todos atributos (Local) ou a opção o Nome, Norte, Leste, Altura, Todos atributos.

3.	Clique OK.

4.	Aparece o diálogo Salvar. Insira um nome de arquivo e local e clique OK.

Cria-se um arquivo contendo atributos.


Para importar um arquivo Survey Controller (*.dc) com atributos

Perspectiva Geral e Mais informações
NOTA: Para usar atributos no Trimble Geomatics Office, é necessário antes configurar um projeto para atributos.

1.	Selecione Arquivo / Importar. Aparece o diálogo Imporatar.

2.	Na guia Levantamento, selecione a opção arquivo Survey Controller (*.dc) e clique OK.

O Trimble Geomatics Office verifica se o arquivo da Biblioteca de Características e Atributos (*.fcl) ou Dicionário de Dados (*.ddf) especificado no projeto atual do Trimble Geomatics Office é o mesmo daquele no arquivo .dc.

Se forem diferentes, escolha entre as seguintes opções:

  Cancele a importação.

  Importe todos pontos e informações de atributos que são reconhecidos pelo projeto atual do Trimble Geomatics Office. Lhe será avisado que pode-se perder dados. O relatório de importação descreve quais as informações de atributo não foram importadas.

  Importe somente pontos (nenhuma informação de atributo é importada).

Se a biblioteca de características e atributos não for definida no projeto atual do Trimble Geomatics Office, pode-se importar o arquivo .dc sem informações do atributo ou cancelar a importação.

NOTA: Se estiver transferindo dados para ou de uma versão 7.60 do Survey Controller, use o formato de arquivo .dc da versão 7.50.


Para adicionar uma camada

 Perspectiva Geral e Mais informações

1.	A partir da Visualização do Plano, escolha uma das seguintes opções:

  Selecione Editar / Camadas.

  Clique a ferramenta Editar camadas.

Aparece o diálogo Camadas.

2.	Clique Novo. Aparece uma nova fila no diálogo Camadas.

3.	No campo Nome, insira um nome singular para a nova camada.

4.	A partir da lista, selecione um estilo de ponto padrão. Este estilo de ponto é usado para todos os pontos que possuam selecionado <Por camada> no campo Estilo do ponto.

5.	Na lista, selecione um estilo de linha padrão. Este estilo de linha é usado para todas linhas, arcos e curvas que possuam selecionado <Por camada> no seu campo Estilo de linha.

6.	Na lista, selecione um estilo de texto. Este estilo de texto é usado para todo texto que tenha selecionado <Por camada> no seu campo de Estilo de texto.

7.	Se desejar exibir todas entidades na camada, marque a caixa de seleção Visível.

8.	Limpe a caixa de seleção Bloqueado para permitir que as entidades da camada sejam selecionadas.

9.	Clique OK.


Para juntar pontos com nomes duplicados

 Perspectiva Geral e Mais informações

Pode-se juntar pontos duplicados no Trimble Geomatics Office se for conhecido que eles são o mesmo ponto físico e se não há necessidade que sejam pontos separados.

CUIDADO: Dois pontos com o mesmo nome, mas com dados significativamente diferentes podem ser o resultado de um erro. A união destes pontos pode produzir resultados inesperados.

1.	Tenha certeza de que os pontos são o mesmo ponto físico. Para fazer isso, escolha Selecionar / Pontos duplicados / Por nome e distância

2.	Insira uma distância de separação e clique OK.

3.	Selecione Editar / Juntar pontos duplicados.

O Trimble Geomatics Office une todas as observações dos pontos e posições digitadas para os pontos. A barra de status apresenta um relatório de um sumário da operação de união.


Para especificar como pontos duplicados são administrados na importação

 Perspectiva Geral e Mais informações

Por padrão, o Trimble Geomatics Office junta pontos com o mesmo nome na importação, portanto pontos não são criados. Pode-se especificar dentro de que tolerância horizontal e/ou vertical o software junta os pontos ou que o software não resolva pontos duplicados ao importar, no diálogo Duplicar opções do ponto.

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Clique Opções. Aparece o diálogo Duplicar opções do ponto.

Escolha uma das seguintes opções:

  Certifique-se de que a opção Sempre juntar pontos duplicados esteja selecionada.

  Selecione a opção Juntar pontos duplicados dentro da tolerância e insira as tolerâncias apropriadas.

  Para configurar o software para que não resolva pontos duplicados na importação, selecione a opção Juntar pontos duplicados e insira um valor de tolerância horizontal de 0,02 (isto é, a tolerância da qualidade de levantamento horizontal) e uma tolerância vertical de 0.050 (isto é, a tolerância da qualidade de levantamento vertical).

NOTA: Se você não especificar um tolerância (isto é, no grupo de tolerâncias, as caixas de seleção horizontal e vertical não são selecionadas) os pontos duplicados serão juntados.

NOTA: Se você configurar a tolerância para 0.000, as coordenadas do ponto duplicado devem ser exatamente as mesmas dos pontos a serem juntados.

Estas configurações aplicam-se para todas opções de importação: importe os arquivos usando a barra do projeto ou arraste e solte os arquivos num projeto do Trimble Geomatics Office, o software usa a última configuração de pontos duplicados especificada.


Para renomear pontos duplicados

 Perspectiva Geral e Mais informações

Use este procedimento para renomear popntos duplicados onde, por exemplo, dois empregados para o trabalho de campo usaram os mesmos nomes para diferentes pontos em diferentes arquivos do Survey Controller (*.dc):

1. 	Importe os arquivos usando a opção Juntar pontos duplicados dentro da tolerância, selecionada no diálogo Duplicar opções do ponto. Configure a tolerância horizontal para 0,02 e a tolerância vertical para 0,050.

NOTA: Se somente perceber que possui pontos duplicados depois de ter importado os dados, desfaça a operação de importação, configure a opção Juntar pontos duplicados dentro da tolerância para 0,02 para a tolerância horizontal (isto é, a tolerância de qualidade de levantamento horizontal) e 0,05 para a tolerância vertical (isto é, a tolerância da qualidade de levantamento vertical) no diálogo Duplicar opções do ponto, e volte a importar os dados.

2.	Selecione o grupo de seleção do arquivo do Survey Controller (*.dc) que adicionou os pontos duplicados no banco de dados. Alternativamente, selecione Selecionar \ Pontos duplicados \ Por nome.

3.	Selecione Editar / Renomear. Aparece o diálogo Renomear.

4.	Insira o novo nome do primeiro ponto da seleção.

O Trimble Geomatics Office renomeia todos os pontos na configuração da seleção. Os pontos são renomeados de acordo com o valor inicial designado ao grupo.

Por exemplo, considere que tenha selecionado cinco pontos. Se substituir o nome do primeiro ponto pelo nome "2000", os quatro pontos restantes são renomeados 2001, 2002, 2003 e 2004.


Para etiquetar pontos usando etiquetas personalizadas

 Perspectiva Geral e Mais informações

Este exemplo etiqueta pontos usando a etiqueta personalizada de uma descrição de ponto.

1.	Use o Microsoft Windows Explorer para localizar o arquivo Opções.ini para o modelo do projeto ou projeto ao qual queira adicionar a opção de etiqueta personalizada.

2.	Use um editor de texto para abrir o arquivo Opções.ini.

3.	Encontre o cabeçalho:

[Etiquetas]

4.	Diretamente depois da última das opções da etiqueta, use o teclado para inserir o seguinte texto:

|X|[Y]

Onde ‘X’ define o nome da etiqueta e ‘Y’ define o código de campo com o qual quer-se etiquetar o ponto.

5.	Abra o modelo do projeto ou projeto no Trimble Geomatics Office.

6.	Selecione Visualizar / Etiquetas de ponto. O diálogo Pontos da etiqueta com aparece com a nova opção adicionada à lista.

7.	Selecione as opções que requer e clique OK.


Para anotar entidades

 Perspectiva Geral e Mais informações

1.	Selecione os pontos, linhas ou arcos que deseja anotar. Para fazê-lo, use uma das seguintes opções:

  O mouse

  O menu Selecionar

2.	Selecione Inserir / Anotações. Aparece o diálogo Anotar.

3.	Na lista, selecione o modelo requerido.

4.	Para editar amostras de edição, clique em Modelos.

  Para manter anotações existentes, marque a caixa de seleção Manter anotações existentes.

  Para remover anotações existentes antes de aplicar as novas anotações, desmarque a caixa Manter anotações existentes.

5.	Se selecionou um grupo de entidades para anotar, consulte se o grupo Anotar está configurado para Seleção.

Se desejar anotar todo o banco de dados, selecione a opção Todo o banco de dados.

Se não houverem entidades selecionadas, o grupo Anotar não será disponível e todo o banco de dados será anotado.

6.	Clique OK para aplicar as anotações.

As anotações são adicionadas ao banco de dados e aparecem na janela de gráficos.


Para criar um grupo de seleção

 Perspectiva Geral e Mais informações

1.	Selecione as entidades (pontos, linhas, observações, curvas, arcos, texto, anotações) que queira incluir no grupo de seleção. Para fazê-lo, escolha uma das seguintes opções:

  O mouse

  O menu Selecionar

2.	Escolha Selecionar / Grupos de seleção / Salvar. Aparece o diálogo Salvar.

3.	Insira um nome para o grupo de seleção e clique OK.

O grupo de seleção agora aparece na lista de configurações de seleção salvadas quando se escolhe Selecionar / Grupos de seleção / Recuperar. Também aparece na lista de grupos de seleção recentemente usados quando se escolhe Selecionar / Grupos de seleção.

SUGESTÃO: Use o diálogo Visualizar filtros para visualizar grupos de seleção.


Para efetuar uma calibração de local GPS

 Perspectiva Geral e Mais informações

Talvez seja necessário efetuar uma calibração do local GPS no Trimble Geomatics Office por uma das seguintes razões:

  para transferir uma calibração para o Trimble Survey Controller

  não foi feita uma calibração no campo

  para criar um relatório para registros de qualidade de cotrole

  para adicionar pontos extras para uma calibração efetuada no Trimble Survey Controller


Preparação para efetuar uma calibração do arquivo GPS

Antes de efetuar uma calibração do local GPS, requer-se estar seguro de que as coordenadas existentes são derivadas de (grid) terrestre ou dados GPS (WGS-84) para cada ponto de calibração.

Se tiver executado uma calibração no Trimble Survey Controller, e os pontos de grid e os pontos GPS possuem o mesmo nome, estes pontos podem ter sido juntados na importação. Os pontos juntados serão separados automaticamente se escolher executar uma calibração do site GPS no Trimble Geomatics Office. Quando isso ocorre, uma mensagem informa que o mesmo nome foi usado para pontos GPS e de grid no software.

Escolha uma das seguintes opções:

  Clique Sim para criar um ponto GPS e um ponto de grid separado com o mesmo nome no banco de dados.

  Clique Cancelar se não quiser executar uma calibração de local GPS ou se desejar explodir pontos manualmente. Se explodir pontos manualmente, lhe será dada a opção de renomear os pontos GPS.


Performing the GPS Site Calibration
Execução da Calibração do Local GPS

1.	Selecione Levantamento / calibração do Local GPS. Aparece o diálogo Calibração do Local GPS.

2.	No grupo componentes da calibração, selecione os parâmetros de calibração que deseja calcular.

3.	Clique Lista de Ponto. Aparece o diálogo Lista de Ponto.

4.	Use o diálogo Lista de Ponto para selecionar os seus pares de ponto (ponto GPS e ponto de grid) para a calibração. Pode ser o mesmo ponto ou ponto diferente com o mesmo nome, desde que sejam encontrados valores GPS e de grid separados.

5.	Com o primeiro ponto GPS que se requer em calibração, escolha uma das seguintes opções:

  Use preenchimento de campo para selecionar o ponto.

  Insira o nome do ponto usando o teclado.

Aparece uma caixa no ponto GPS na janela de gráficos.

NOTA: Se possuir um ponto de grid correspondente, com o mesmo nome, a lista de Pontos é preenchida automaticamente.

6.	Para inserir o ponto de grid associado ao ponto GPS selecionado, escolha uma das seguintes opções:

  Use preenchimento de campo para selecionar o ponto.

  Insira o nome do ponto através do teclado.

Uma cruz aparece no ponto do grid na janela de gráficos e uma nova entrada no diálogo  Lista de Pontos é adicionada.

O campo tipo atualiza-se para indicar se o ponto selecionado possui um componente de coordenadas horizontal ou vertical (ou ambos). Se não houver componentes comuns de coordenadas, o Tipo é visualizado como inválido e as coordenadas não são usadas.

7.	Repita os dois passos acima para selecionar todos os pares de pontos que deseja na calibracão.

8.	Ao selecionar todos pares de ponto, clique em Fechar para voltar ao diálogo Calibração do GPS.

NOTA: As estatísticas da calibração aparecem na base do diálogo de Pontos e são computadas após a entrada de um par de pontos válido. Use estas estatísticas para identificar pares de pontos incorretos.

9.	Clique Computar para calcular os parâmetros de calibração. Os resultados da calibração aparecem no grupo sumário da Calibração.

10.	Se os resultados estiverem fora dos limites esperados, use o relatório Calibração do Local GPS para verificar qualquer residual entre pares de ponto. Clique Relatório para gerar o relatório Calibração do Local GPS. O relatório é apresentado no visualizador HTML padrão.

11.	Verifique os residuais na seção do relatório intitulada Diferenças residuais entre GPS e coordenadas conhecidas. Se necessário, remova todos pares de pontos suspeitos e volte a aplicar a calibração.

12.	Clique OK para aplicar a calibração ao projeto.

O sistema de coordenadas é atualizado com os parâmetros da calibração.


Para processar códigos de características

 Perspectiva Geral e Mais informações

1.	Escolha Selecionar / Grupos de seleção / Recuperar. Aparece o diálogo Recuperar.

2.	Selecione o grupo de seleção que possui o mesmo nome do arquivo para processar (o arquivo no qual foram coletados os códigos de características). Este grupo de seleção foi criado automaticamente quando o arquivo foi importado e possui um registro da ordem na qual pontos foram coletados no campo. Usando este grupo de seleção, garante-se que os códigos de característica são processados na ordem correta.

3.	Selecione Ferramentas / Códigos de característica do processo. Aparece o diálogo Códigos de características do processo.

4.	Selecione a biblioteca requerida para processar códigos de característica e clique OK.

O Trimble Geomatics Office processa os códigos de característica. Os códigos de característica processados aparecem na janela de gráficos.


Para visualizar um inverso

 Perspectiva Geral e Mais informações

Para determinar o inverso entre dois pontos do projeto:

1.	Selecione Levantamento / Inverso. Aparece o diálogo Inverso e o ponteiro torna-se um ponteiro de preenchimento do campo.

2.	Clique o primeiro ponto requerido para o cálculo inverso. O nome do ponto aparece no campo De do diálogo Inverso.

3.	Clique o segundo ponto requerido para o cálculo inverso. Quando o mouse estiver posicionado sobre o ponteiro, aparece uma linha pontilhada.

O nome do ponto aparece no campo Para do diálogo Inverso e os valores inversos são exibidos automaticamente no grupo Inverso.

NOTA: Se pontos forem inseridos nos campos através do uso do teclado, clique Calcular para computar o inverso.

4.	Clique Detalhado para visualizar informações adicionais nesta computação inversa. O grupos Detalhes é anexado ao pé do diálogo e exibe as informações adicionais no inverso.

5.	Clique Enviar para relatório para gerar um relatório no inverso. Um relatório breve ou detalhado será criado, dependendo da opção da exibição usada (breve ou detalhada).

6.	Clique Mostrar relatório para visualizar o relatório no visualizador HTML.

7.	Para visualizar outro inverso, clique nos campos do ponto e volte a selecionar os pontos.


Para medir áreas

Use a ferramenta Medir para visualizar o azimute e distância entre as dois últimos locais selecionados e a área criada pelos locais selecionados na operação atual de medição.

1.	Selecione Levantamento / Medir. Aparece o diálogo Medir.

2.	Clique o primeiro local (que não deve necessariamente ser um ponto) na janela de gráficos.

3.	Continue para clicar locais na janela de gráficos. Cada vez que selecionar um local, as coordenadas são usadas para calcular os campos do diálogo Medir. Uma linha aparece ligando os locais selecionados.

Os campos do diálogo Medir são atualizados cada vez que um novo local é clicado. Os valores não são armazenados no banco de dados.

4.	Clique Redefinir para limpar os valores.


Para executar uma transformação de coordenada

 Perspectiva Geral e Mais informações

Use a transformação de coordenada para transformar e/ou girar pontos selecionados. Este exemplo ilustra como transformar todos os pontos do banco de dados inserindo coordenadas conhecidas para um ponto existente.

1.	Selecione os pontos que deseje transformar ou girar.

2.	Selecione Levantamento / Transformação da Coordenada. Aparece o diálogo Transformação de Coordenadas.

3.	Clique Lista de Ponto. Aparece o diálogo Transformação de Coordenadas - Lista de Ponto.

4.	Escolha uma das seguintes opções:

  No campo Ponto, insira o nome do ponto existente.

  Use preenchimento de campo para selecionar o ponto.

O campo Ponto, campo Norte atual e campo Leste atual são preenchidos e o campo Norte conhecido é selecionado.

5.	Nos campos Norte conhecido e Leste conhecido, escolha uma das seguintes opções:

  Insira o norte e leste conhecidos para o ponto.

  Use o preenchimento do campo para selecionar o norte e leste conhecidos do ponto.

Uma linha aparece na janela de gráficos para mostrar a diferença entre as coordenadas atuais e conhecidas.

O grupo de estatísticas mostra o fator escala de o resíduo máximo horizontal. Use-os para identificar pares de pontos maus.

6.	Clique OK. Aparece um diálogo exibindo os erros residuais.

7.	O diálogo Transformação de Coordenadas é restabelecido e os campos Translação norte e Translatção leste são preenchidos com os valores calculados das coordenadas atuais e conhecidas.

8.	Clique OK para aplicar a transformação de coordenadas para todo o banco de dados.

NOTA: Pode-se desfazer uma transformação de coordenadas.


Para executar um ajuste na elevação

 Perspectiva Geral e Mais informações

Use um ajuste de elevação para ajustar as elevações para pontos selecionados. Este exemplo mostra como ajustar as elevações de todos pontos do banco de dados, inserindo uma elevação conhecida para um ponto existente.

1.	Selecione Levantamento / Ajuste de Elevação. Aparece o diálogo Ajuste de elevação.

2.	Clique Lista de Ponto. Aparece o diálogo Ajuste de elevação - Lista de Ponto.

3.	Escolha uma das seguintes opções:

  No campo Ponto, insira o nome do ponto existente.

  Use o preenchimento de campo para selecionar o ponto.

Uma caixa aparece sobre o ponto selecionado.

Os campos Ponto, Norte atual, Leste atual e Elevação atual são preenchidos.

4.	Escolha uma das seguintes opções:

  No campo Elevação conhecida, insira a elevação conhecida para o ponto.

  Use o preenchimento de campo para selecionar a elevação de outro ponto.

O grupo de estatísticas mostra o fator de escala e a inclinação máxima do ajuste e o resíduo vertical máximo. Use-os para identificar pares de pontos maus.

5.	Clique OK para voltar ao diálogo Ajuste da elevação.

Os campos Norte de origem e Leste de origem são preenchidos com as coordenadas do primeiro ponto que foi usado. O campo Constante correção é preenchido com o ajuste calculado da elevação. Os campos Correção por unidade norte e Correção por unidade leste somente são preenchidos se mais de um ponto for usado para definir o ajuste ada elevação.

6.	Clique OK para aplicar o ajuste de elevação em todo o banco de dados.

NOTA: Pode-se desfazer um ajuste de elevação.


Para usar códigos de campo

 Perspectiva Geral e Mais informações

Use códigos de campo para exibir valores de:

  campos

  variáveis em anotações, relatórios, formatos de exportação, texto

Códigos de campo também são úteis para definição de relatórios e formatos de exportação. Este exemplo ilustra como usar códigos de campo para definir um formato de exportação. O formato define um texto delimitado por vírgula contendo o nome do ponto (em maiúsculas), norte (com unidades), leste (com unidades) e elevação (com unidades).

1.	Selecione Campo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Personalizar, clique Novo. Aparece o diálogo Definir Formato de Exportação ASCII.

3.	No campo Nome, insira um nome.

4.	Clique o lado direito do mouse no campo Formatar corpo e selecione Campos / Nome do menu do atalho.

[Nome] aparece na caixa Formatar corpo.

5.	Clique o lado direito do mouse para acessar o menu de atalho e selecionar Campos / Avançado / Modificadores / Maiúsculas.

[Nome:Maiúsculas] aparece na caixa de formatar corpo. Isso significa que todos nomes de pontos serão exportados em letras maiúsculas para cada letra incluída no nome do ponto.

6.	Insira uma vírgula seguida de um espaço.

7.	Clique o lado direito do mouse para acessar o menu de atalho e selecionar Campos / Norte.

[Norte] aparece ao lado da vírgula.

8.	Clique o lado direito do mouse para acessar o menu de atalho e selecionar Campo / Avançado / Modificadores / Unidades.

[Norte] muda para [Norte:unidades]. Isso significa que a unidade atual das coordenadas é incluída no arquivo.

9.	Insira uma vírgula seguida de um espaço.

10.	Clique o lado direito do mouse para acessar o menu de atalho e selecionar Campo / Leste.

[Leste] aparece ao lado da vírgula.

11.	Clique o lado direito do mouse e selecione Campos / Avançado / Modificadores / Unidades  do menu de atalho.

[Leste] muda para [Leste:unidades]. Isso quer dizer que a unidade atual da coordenada está incluída no arquivo.

12.	Insira uma vírgula, seguida de um espaço.

13.	Clique o lado direito do mouse e selecione Campos / Elevação do menu de atalho.

[Elevação] aparece ao lado da vírgula.

14.	Clique o lado direito do mouse e selecione Campos / Avançado / Modificadores / Unidades do menu de atalho.

[Elevação] muda para [Elevação:unidades]. Isso significa que a unidade atual da coordenadas está incluída no arquivo.

15.	Clique OK para salvar o formato de exportação. Aparece o diálogo Exportar. O formato criado aparece na lista na guia Comum.

16.	Para exportar dados neste formato, selecione o formato e clique OK. Aparece o diálogo Salvar como.

17. No campo Nome do arquivo, insira um nome para o arquivo de exportação.

18.	Clique Salvar para criar o arquivo.


Para usar o preenchimento de campo

 Perspectiva Geral e Mais informações

Use o preenchimento de campo para inserir valores para campos a partir de entidades existentes no banco de dados. Quando o preenchimento de campo estiver disponível, o ponteiro de preenchimento de campo aparece na janela de gráficos. Este exemplo usa preenchimento para selecionar as coordenadas quando se adiciona uma entidade de texto.

1.	Selecione Inserir / Texto. Aparece o diálogo Inserir texto.

2.	No campo Expressão do texto, insira o texto.

3.	Selecione o campo Norte.

4.	Coloque o ponteiro sobre a janela de gráficos. Aparece o ponteiro de preenchimento de Campo.

5.	Clique o local na janela de gráficos onde quiser que o texto apareça. As coordenadas são preenchidas nos campos Norte e Leste.

6.	Clique OK para adicionar o texto ao banco de dados.

SUGESTÃO: Pode-se usar preenchimento de campo para inserir os tempos de uma observação (clicando na observação).


Para especificar graficamente o ajuste da folha (desenhando / imprimindo)

 Perspectiva Geral e Mais informações

1.	Selecione Arquivo / Ajuste da folha. Aparece o diálogo Ajuste da folha.

2.	Clique Ajuste ideal.

3.	Clique o campo Norte da origem ou Leste da origem. Aparece o ponteiro de preencher campo.

4.	Clique na janela de gráficos no local que desejar para o ângulo esquerdo esquerdo da área do desenho.

5.	Configure a rotação para o ajuste ideal dos dados do projeto do formulário plano selecionado.

6.	Na janela de gráficos, clique e arraste a caixa de desenho sobre os dados do projeto.

7.	Mude a escala para um valor padrão. Por exemplo, se o ajuste ideal do desenho é de 1:435, mude para 1:500.

8.	Clique OK para aplicar as configurações do Ajuste da folha.


Para selecionar um modelo geóide para um projeto

 Perspectiva Geral e Mais informações

Para selecionar um modelo geóide para um projeto, use o assistente do Sistema de Coordenadas. Isso também vale mesmo se quiser mudar o modelo geóide para o sistema de coordenadas atual.

1.	Selecione Arquivo / Propriedades do projeto. Aparece o diálogo Proprieades do projeto.

2.	Selecione a guia Sistema de coordenadas.

3.	No grupo de Configurações do Sistema de Coordenadas, clique Mudar. Aparece o diálogo Selecionar Sistema de Coordenadas.

4.	Selecione a opção Novo sistema e clique Próximo. Aparece o diálogo Selecionar Tipo de Sistema de Coordenadas.

5.	Selecione o tipo apropriado de sistema de coordenadas. Aparece o diálogo Selecionar Modelo Geóide no final do assistente de seleção do sistema de coordenadas. Selecione o modelo geóide requerido. A lista de modelos geóide disponíveis é lido do banco de dados do sistema de coordenadas. O modelo geóide padrão para o sistema de coordenadas é selecionado por padrão.

6.	Clique Concluir.

O modelo geóide selecionado é aplicado ao projeto.

NOTA: Pode-se selecionar o modelo geóide padrão para um sistema de coordenadas usando a utilidade Trimble Coordinate System Manager™.


Para cortar e copiar pontos com atributos entre projetos

 Perspectiva Geral e Mais informações

1.	A partir do projeto da fonte, selecione os pontos que queira copiar para o projeto de destino. Use o comando de característica Selecionar / Por ponto (disponível na Visualização do plano) para selecionar pontos com a característica especificada.

2.	Para copiar os pontos requeridos no novo projeto, selecione Editar / Copiar.

3.	No projeto de destino, selecione Editar / Colar para colar os pontos.

4.	Se as definições de atributos forem diferentes em dois projetos, aparece um diálogo.

5.	Clique Sim para colar os dados comuns para ambas bibliotecas de características e atributos. Todos dados de atributos não colados são registrados no relatório Colar.rpt. O relatório é armazenado na pasta de relatórios do projeto no qual se está colando.

NOTA: Somente pontos podem ser cortados e copiados entre os projetos. Se observações fossem usadas para posicionar pontos, as coordenadas derivadas seriam copiadas. Se os pontos fossem derivados de coordenadas GPS e observações, a coordenada WGS-84 seria copiada. Esta coordenada WGS-84 copiada pode ser usada em calibrações de local GPS no novo projeto.


Para adicionar atributos a um ponto

 Perspectiva Geral e Mais informações

Para adicionar atributos, deve-se configurar o projeto para atributos.

1.	Selecione o ponto ao qual deseje adicionar atributos. Para fazê-lo, escolha uma das seguintes opções:

  O mouse

  O menu Selecionar

2.	Abra a janela Propriedades.

3.	Na guia Atributos, clique o ícone Menu da página [image]. Aparece o menu de atalho.

4.	Clique Inserir. Aparece a lista de códigos de característica com atributos disponíveis.

5.	Selecione o código de característica com atributos que deseje adicionar. Aparecem os  atributos para o código de característica selecionado.

6.	Insira valores para cada atributo. O Trimble Geomatics Office verifica cada valor inserido. Esta verificação garante que o valor é válido de acordo com a biblioteca de  características e atributos usadas para configurar o projeto para atributos.

7.	Repita os passos acima para todos outros códigos de características com atributos que deseje adicionar ao ponto.


Para visualizar atributos

 Perspectiva geral e Mais informações

1.	Selecione os pontos. Para fazê-lo, escolha uma das seguintes opções:

  O mouse

  O menu Selecionar

2.	Abra a janela de Propriedades.

3.	Selecione a guia Atributos.

Somente pode-se visualizar um código de característica com atributos de cada vez. Para visualizar um código de característica diferente com atributos, use a lista suspensa.

NOTA: A guia Atributos somente aparece se uma biblioteca de características e atributos foi configurara para o projeto no diálogo Propriedades do Projeto / guia Características.


Para editar atributos

 Perspectiva Geral e Mais informações

1.	Clique o atributo. Se o atributo for um menu, aparece uma seta no lado direito do campo.

2.	Clique a seta para exibir a lista de opções do menu para o atributo.

Todos outros tipos de atributos devem ser digitados no teclado.

NOTA: Quando se editam informações do atributo, o Trimble Geomatics Office verifica a definição da biblioteca de características e atributos para garantir que valores válidos tenham sido inseridos.


Para inserir uma linha

 Perspectiva Geral e Mais informações

1.	Selecione a Visualização do plano. Escolha uma das seguintes opções:

  Selecione Visualização / Plano.

  Clique a ferramenta da Visualização do plano.

  Pressione Alt+2.

2.	Escolha uma das seguintes opções:

  Selecione Inserir / Linhas.

  Selecione a ferramenta Inserir linha.

Aparece o diálogo Inserir trabalho da linha com a guia da Linha selecionada.

3.	No campo Do ponto, escolha uma das seguintes opções:

  Use preenchimento de campo para selecionar o primeiro ponto requerido para definir a linha.

  Insira o nome do ponto para o primeiro ponto requerido para definir a linha.

4.	No campo Para ponto, escolha uma das seguintes opções:

  Use o preenchimento do campo para selecionar o segundo ponto requerido para definir a linha.

  Insira o nome do ponto para o segundo ponto requerido para definir a linha.

5.	No campo Camada, escolha uma das seguintes opções:

  Selecione a camada à qual deseja adicionar a linha.

  Insira o nome da nova camada para criar um nova camada.

6.	No campo Estilo da linha, selecione o estilo da linha requerido para visualizar a linha.

7.	Para adicionar a linha, escolha uma das seguintes opções:

  Clique Inserir.

  Pressione Enter.

O ponto selecionado no campo Para o ponto aparece no campo Do ponto. Pode-se continuar adicionando linhas sem ter que reentrar o ponto “de”.

A linha aparece na janela de gráficos (desde que a camada selecionada para a linha tenha a sua propriedade visível ativada).

8.	Clique Fechar para interromper a entrada de linhas.


Para inserir uma curva

 Perspectiva Geral e Mais informações

1.	Selecione a Visualização do plano. Escolha uma das seguintes opções:

  Selecione Visualização / Plano.

  Clique a ferramenta da Visualização do plano.

  Pressione Alt+2.

2.	Selecione Inserir / Curvas. Aparece o diálogo Inserir trabalho da linha com a guia da Linha selecionada.

3.	No campo Do ponto, escolha uma das seguintes opções:

  Use preenchimento de campo e clique os pontos apropriados.

  Use o teclado para inserir o nome do ponto.

4.	No campo Para ponto, escolha uma das seguintes opções:

  Use o preenchimento do campo e clique os pontos apropriados

  Use o teclado para inserir o nome do ponto.

5.	Nos campos Tangente da entrada e Tangente da saída, deixe os valores como <Automático> para inserir automaticamente os valores da tangente baseados nos pontos usados para definir a curva. Pode-se inserir seus próprios valores de tangente.

6.	No campo Vagalhão, inserir um valor entre 0 e 1. O vagalhão define a largura da curva. Maior o vagalhão, maior é a largura da curva.

7.	No campo Camada, escolha uma das seguintes opções:

  Selecione a camada na qual queira adicionar a curva.

  Insira um novo nome de camada para criar uma nova camada.

8.	No campo Estilo de linha, selecione o estilo de linha requerido para visualizar a curva.

9.	Para adicionar a curva, escolha uma das seguintes opções:

  Clique Inserir.

  Pressione Enter.

A curva aparece na janela de gráficos (desde que a camada selecionada para a curva tenha a sua propriedade visível ativada). Cada vez que se adiciona uma curva de um ponto que é usado em outra curva, o Trimble Geomatics Office recalcula a curva existente para garantir a visualização de uma curva suave.

10.	Clique Fechar para interromper a entrada de curvas.


Para inserir um arco

 Perspectiva Geral e Mais informações

1.	Selecione a Visualização do plano. Escolha uma das seguintes opções:

  Selecione Visualização / Plano.

  Clique a ferramenta Visualização do plano.

  Selecione Alt+2.

2.	Selecione Inserir / Arcos. Aparece o diálogo Inserir trabalho da linha com a guia Arco selecionada.

3.	No campo Do ponto, escolha uma das seguintes opções:

  Use o preenchimento de campo e clique o ponto apropriado.

  Use o teclado para inserir o nome do ponto.

4.	No campo Para o ponto, escolha uma das seguintes opções:

  Use o preenchimento de campo e clique o ponto apropriado.

  Use o teclado para digitar o nome do ponto.

5.	Para usar um ponto existente como o centro do arco, no campo Ponto central escolha uma das seguintes opções:

  Insira um nome de ponto existente.

  Use o preenchimento de campo para selecionar um ponto existente.

As coordenadas para o ponto são copiadas para os campos Norte do centro e Leste do centro.

6.	Nos campo Norte do centro e Leste do centro, clique um local da janela de gráficos para usar coordenadas como o centro do arco. As coordenadas são copiadas para estes campos.

Se tanto o ponto do centro quanto as coordenadas do centro forem selecionados, o ponto do centro será usado.

7.	No campo Pequeno arco, selecione a opção Falso, se desejar criar um arco grande. Caso contrário, selecione Verdadeiro. Sempre existirão dois arcos possíveis entre dois pontos que, juntamente, definem um círculo. Esta configuração define quais arcos quer desenhar.

8.	No campo Camada, escolha uma das seguintes opções:

  Selecione a camada à  qual quer adicionar o arco.

  Insira um novo nome de camada para criar uma nova camada.

9.	No campo Estilo de linhas, selecione o estilo de linhas requerido para visualizar o arco.

10.	Para adicionar a curva, escolha uma das seguintes opções:

  Clique Inserir.

  Pressione Enter.

O arco aparece na janela de gráficos (desde que a camada selecionada para o arco tenha a sua propriedade visível esteja ativada).

11.	Clique Fechar para interromper o entrada de arcos.


Para inserir textos

 Perspectiva Geral e Mais informações

1.	Selecione a Visualização do plano. Escolha uma das seguintes opções:

  Selecione Visualizar / Plano.

  Clique a ferramenta Visualização do plano.

  Pressione Alt+2.

2.	Escolha uma das seguintes opções:

  Selecione Inserir / Texto.

  Clique o ferramenta Inserir texto.

Aparece o diálogo Inserir Texto.

3.	No campo Expressão do texto, insira o texto que deve ser exibido. Para usar códigos de campo (por exemplo, o título do projeto), clique o lado direito do mouse para ver o menu de atalho e selecionar Campos.

4.	No campo Norte, insira o valor norte para o local do texto. Alternativamente, use o preenchimento de texto, clicando num local da janela de gráficos.

5.	No campo Leste, insira o valor de leste para o local do texto. Alternativamente, use o preenchimento de campo, clicando num local da janela de gráficos.

6.	No campo Orientação, insira a orientação para a entidade de texto. Se uma orientação não for especificada, o texto será exibido horizontalmente na janela.

7.	No campo Tipo de âncora, especifique onde o texto está localizado com referência ao valores Norte e Leste, e selecione um valor da lista.

8.	No campo Camada, selecione a camada na qual queira adicionar texto de uma lista. Para inserir texto numa nova camada, digite um novo nome.

9.	No campo Estilo de texto, selecione o estilo de texto para a entidade de texto da lista. Se requerer que o estilo padrão do texto seja configurado para a camada à qual está adicionando o texto, selecione a opção <Por camada>.

10.	Clique Inserir para adicionar o texto para o banco de dados e manter o diálogo aberto para adicionar mais texto.

11.	Clique Fechar para deixar de inserir texto..


Para criar um novo modelo de projeto

 Perspectiva Geral e Mais informações

1.	Escolha uma das seguintes opções:

  Clique a ferramenta Novo.

  Selecione Arquivo / Novo projeto.

Aparece o diálogo Novo projeto.

2.	No grupo Novo, selecione a opção do Modelo. A pasta do Projeto do grupo Detalhes muda para a pasta padrão do modelo.

3.	No campo Nome, insira um nome para o modelo do projeto.

4.	No campo Modelo, selecione um modelo da lista e clique OK. Aparece o diálogo Propriedades do projeto.

5.	Selecione as propriedades de projeto que serão o padrão para todos projetos que usam este modelo e clique OK.

Aparece uma mensagem. Para continuar trabalhando no modelo, clique Sim. Para fechar o modelo do projeto, clique Não.

6.	Se selecionar Sim, pode-se continuar trabalhando no modelo do projeto. Para concluir o trabalho num modelo de projeto, selecione Arquivo / Fechar.

7.	Ao criar um novo projeto, verá o novo modelo na lista de Modelos do diálogo Novo projeto.


Para criar um estilo de ponto

 Perspectiva Geral e Mais informações

1.	Na Visualização do plano, selecione Editar / Estilos. Aparece o diálogo Estilos do CAD.

2.	Na guia Estilos de ponto, clique Novo. Aparece o diálogo Criar estilo de ponto.

3.	Preencha o diálogo Criar estilo de ponto.

4.	Clique OK.

O estilo de ponto é adicionado ao banco de dados. Ele aparece no diálogo Estilos CAD – guia Estilos de ponto.


Para abrir a janela Propriedades

Perspectiva Geral e Mais informações
Escolha uma das seguintes opções:

  Selecione Editar / Propriedades.

  Clique a ferramenta Editar propriedades [image].

  Escolha Propriedades no menu de atalho

  Clique duas vezes numa entidade gráfica.

  Pressione Alt + Enter.


Para exportar um arquivo do dicionário de dados (.ddf) para o Trimble Survey Controller

 Perspectiva Geral e Mais informações

NOTA: Somente pode-se transferir arquivos .ddf para um dispositivo executando a versão 7.00 ou mais recente do Trimble Survey Controller.

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção Arquivos de Dicionários de Dados ao Survey Controller (*.ddf) e clique OK. Aparece o diálogo Selecionar.

3.	Selecione o arquivo que deseje transferir para o Trimble Survey Controller e clique Abrir. Aparece o diálogo Salvar.

4.	Selecione um dispositivo do Survey Controller e clique Abrir. Aparece o diálogo Conectando.

Quando a conexão ao dispositivo é efetuada, a Memória Principal (C:) aparece na caixa. Se um PC card estiver inserido no dispositivo, aparece também o PC card (A:).

NOTA: Se o dispositivo da Trimble não contar com um PC Card, este diálogo não será disponível.

5.	Escolha uma das seguintes opções:

  Selecione a opção Memória Principal (C:) para armazenar o arquivo na memória do Trimble Survey Controller.

  Selecione a opção PC card (A:) se tiver instalado um PC card e quiser armazenar o arquivo no PC card.

6.	Clique Abrir. A memória principal ou PC card é lida. Os arquivos do Dicionário de Dados existente aparecem.

7.	No campo Nome do arquivo, aparece o nome interno do arquivo .ddf selecionado para exportação. Este é o nome que será visto no Trimble Survey Controller.

8.	Se necessário, edite o nome.

9.	Clique Salvar. Aparece o diálogo Carregando e a barra de progresso mostra o progresso da transferência.

Quando a transferência é completada, o diálogo Carregando desaparece e volta-se à janela de gráficos. Agora pode-se usar o arquivo .ddf com o Trimble Survey Controller.

NOTA: Se estiver transferindo dados para ou de uma versão 7.60 do Survey Controller, use o formato de arquivo .dc da versão 7.50.


Para arrastar e soltar um arquivo num projeto

Perspectiva Geral e Mais informações
Para arrastar e soltar um arquivo para um projeto:

1.	Abra o projeto do Trimble Geomatics Office para o qual transferir os arquivos.

2.	Abra o Microsoft Windows Explorer. Para maiores informações, consulte a documentação do sistema operacional do Microsoft Windows.

3.	Localize a pasta que contém os arquivos para importar.

4.	Clique o lado direito do mouse nos arquivos para importar.

5.	Arraste o arquivo para a janela de gráficos do Trimble Geomatics Office.

6.	Solte o botão direito do mouse para ver o menu de atalho.

7.	Selecione a opção de arquivo apropriada.

8.	Clique o lado esquerdo do mouse. Os arquivos são importados.

Para maiores informações sobre as ações possíveis que ocorrem durante a importação, consulte Importação – Perspectiva geral. Os arquivos são armazenados na pasta Arquivos de dados\Arquivos da Trimble para o projeto.


Para selecionar pontos por nome

1.	Escolha Selecionar / Pontos. Aparece o diálogo Selecionar pontos.

2.	Selecione a guia Geral.

3.	No campo Combinando nome, insira o nome do ponto que deseja selecionar. Também pode-se usar limites e caracteres curingas para selecionar múltiplos pontos.

4.	Clique OK. Os pontos que combinam com o seu nome são selecionados. A barra de status exibe o número de pontos selecionados.

NOTA: Todas entidades atualmente selecionadas antes de usar o diálogo Selecionar pontos não são retidas no grupo de seleção, a não ser que marque a caixa de seleção Adicionar à seleção atual.


Para selecionar pontos por qualidade

1.	Escolha Selecionar / Pontos. Aparece o diálogo Selecionar pontos.

2.	Selecione a guia Geral.

3.	No campo Com qualidade do ponto, selecione a combinação do componente e qualidade que deseja selecionar. Pode-se selecionar múltiplas entradas da lista.

4.	Clique OK.

Os pontos que combinam a sua seleção são selecionados. A barra de status mostra quantos pontos são selecionados.

NOTA: Todas entidades atualmente selecionadas antes que se use o diálogo Selecionar pontos não são retidas no grupo de seleção, a não ser que se marque a caixa de seleção Adicionar à seleção atual.


Para selecionar observações de um ponto selecionado

1.	Na Visualização do levantamento, escolha Selecionar / Observações. Aparece o diálogo Selecionar observações.

2.	No campo Do ponto, inserir o nome do ponto ou inserir um limite para usar múltiplos pontos na seleção. Também pode-se usar preenchimento de campo e curingas.

3.	Clique OK.

As observações dos pontos que combinam com a sua seleção são selecionadas. A barra de status mostra quantas observações são selecionadas.

NOTA: Todas entidades atualmente selecionadas antes do uso do diálogo Selecionar pontos não são retidas no grupo de seleção, a não ser que se marque a caixa de seleção Adicionar à seleção atual.


Para desativar observações

1.	Na Visualização do levantamento, selecione uma observação.

2.	Escolha uma das seguintes opções:

  Abra a janela Propriedades. Clique o ícone Sumário e [image] marque a opção Desativado no campo Status.

  Selecione Editar / Habilitar/desabilitar observação.

NOTA: Desabilitar observações requer uma recomputação para atualizar as informações do levantamento. Quando se move um ponto, todas observações dele são desabilitadas automaticamente.


Para importar trabalhos do Trimble Survey Controller para o Trimble Geomatics Office

1.	Escolha uma das seguintes opções:

  Selecione Arquivo / Importar.

  Clique a ferramenta Importar.

2.	Na guia Levantamento, selecione a opção dispositivos de levantamento. Aparece o diálogo Transferência de dados aberta.

3.	Selecione um dispositivo do Trimble Survey Controller.

4.	Clique Abrir. Aparece o diálogo Conectando. Quando a conexão é efetuada, o diálogo Abrir atualiza para exibir o dispositivo selecionado.

5.	Selecione os arquivos que deseja transferir de uma opção para outra:

  Opção da Memória Principal (C:) para os arquivos armazenados na memória principal do Trimble Survey Controller.

  A opção PC card (A:) para os arquivos armazenados num PC card inserido no Survey Controller.

NOTA: Se o dispositivo da Trimble não possuir um PC Card, este diálogo não será disponível.

6.	Clique Abrir. Aparece o diálogo Recebendo e a barra de progresso apresenta o progresso da transferência. Quando a transferência é completada, o diálogo Recebendo desaparece e a conexão ao dispositivo é interrompida.


Para ocultar (ou exibir) uma barra de ferramentas

1.	Escolha uma das seguintes opções:

  Clique o lado direito do mouse sobre a área da barra de ferramentas. Aparece um menu de atalho.

  Selecione Visualização / Barra de ferramentas. Aparece um menu.

Aparece a lista de barras de ferramentas disponíveis. Cada barra de ferramentas atualmente visíveis possui uma marca de verificação ao lado dos seus nomes.

2.	Selecione a barra de ferramentas que necessite. A barra de ferramentas desaparece (ou reaparece) na janela de gráficos do Trimble Geomatics Office.

3.	Para visualizar a barra de ferramentas novamente, repita os passos acima.


Para transferir detalhes da antena para o Trimble Survey Controller

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione a opção Detalhes da Antena para o Survey Controller. Aparece o diálogo Transferência de dados Salvar como.

3.	Selecione um dispositivo do Trimble Survey Controller e clique Abrir. Aparece o diálogo Conectando. Quando uma conexão é efetuada, aparece o diálogo Salvar.

4.	Escolha uma das seguintes opções:

  Selecione a opção Memória Principal (C:) para armazenar o arquivo na memória principal do Trimble Survey Controller.

  Selecione a opção PC card (A:) se contar com um PC card inserido no dispositivo e quiser armazenar o arquivo no PC card.

NOTA: Se o coletor de dados do dispositivo não possuir um PC card, este diálogo não será disponível.

5.	Clique Abrir. O diretório selecionado é lido. Todos arquivos do Survey Controller da pasta são exibidos. O nome do projeto do Trimble Geomatics Office aparece no campo Nome do arquivo. Este é o nome do trabalho do Trimble Survey Controller que será exportado para o Trimble Survey Controller. Pode-se editar este nome, se necessário.

6.	Clique Salvar. Aparece o diálogo Carregando e a barra de progresso exibe o progresso da transferência.

O arquivo Antena.ini (localizado na pasta \Arquivos do Programa\Arquivos comuns\Trimble\Pasta de config) é transferido para o software Trimble Survey Controller.

Quando a transferência está completada, o diálogo Carregando desaparece e a conexão ao dispositivo é interrompida.


Para exportar notas de atributos

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia CAD / ASCII, selecione a opção Notas de atributo do arquivo DC (Survey Controller V4) e clique OK. Aparece o diálogo Salvar.

3.	Insira o nome do arquivo.

4.	Clique Salvar.


Para exibir informações sobre o software Trimble Geomatics Office

1.	A partir do menu Ajuda, selecione o comando Sobre o Trimble Geomatics Office. Aparece o diálogo Sobre o Trimble Geomatics Office.

2.	Clique OK.


Inverter direção de uma observação

1.	A partir da Visualização do levantamento, selecione a observação que deseja aplicar na direção oposta.

2.	Selecione Editar / Inverter Fluxo da Observação.

3.	A direção da observação é invertida. Quando a observação é aplicada na direção oposta, as coordenadas calculadas e qualidades do ponto podem mudar.

CUIDADO: Se o ponto do qual a observação deve fluir não possuir uma posição conhecida (tal com um ponto RTK observado), a observação não é aplicada.

NOTA: As observações terrestres coletadas com o uso de uma estação total não podem ser invertidas.


Para visualizar erros e avisos

1.	Escolha uma das seguintes opções:

  A partir da Visualização do levantamento, clique duas vezes um ponto ou uma observação com um sinalizador-indicador de aviso.

  Clique duas vezes no ícone sinalizador da barra de status para selecionar todos pontos e observações com sinalizadores-indicadores de aviso.

A Janela de Propriedades aparece com as entidades selecionadas.

2.	Na janela de Propriedades, selecione o ponto ou observação que deseja visualizar (se possuir mais de uma entidade na sua seleção).

3.	Para visualizar a página de Aviso, clique o botão do menu Aviso [image].

A mensagem exibe o tipo de erro que ocorreu.

4.	Para visualizar detalhes para um ponto, selecione a ferramenta do relatório Derivação do ponto [image].

Aparece o relatório Derivação do ponto.


Para transferir arquivos do Grid UK National (*.pgf) ao Trimble Survey Controller

NOTA: Somente pode-se transferir arquivos .pgf para a versão 7.50 ou mais recente do Trimble Survey Controller:

1.	Inicie a utilidade Trimble Data Transfer. Escolha uma das seguintes opções:

  Selecione Utilidades / Transferência de dados quando o projeto está aberto.

  Selecione Iniciar / Programas / Trimble / Utilidades da Trimble / Transferência de Dados a qualquer momento.

Aparece o diálogo Transferência de Dados.

2.	Selecione a guia Enviar.

3.	Na lista de Dispositivos, selecione o dispositivo Survey Controller para o qual exportará os arquivos. A utilidade Data Transfer da Trimble tenta conectar ao dispositivo selecionado. Quando a conexão tem êxito, o cabo do ícone no alto à direita muda e mostra o dispositivo ao qual está conectado, e a linha de status sob o ícone no alto à direita diz ‘Conectado ao <dispositivo>’, onde <dispositivo> representa o tipo de dispositivo (tal como um Survey Controller).

4.	Clique Adicionar. Aparece o diálogo Abrir. A função Ver na lista mostra a última pasta da qual foram selecionados arquivos para este dispositivo e a lista principal mostra as pastas e arquivos naquela pasta.

5.	Da lista Arquivos do tipo, selecione a opção Arquivos Grid UK National (*.PGF).

6.	Use Ver na lista e caixa da lista para mudar a unidade e pasta selecionadas e selecione os arquivos que deseja transferir.

Para transferir os arquivos .pgf existentes fornecidos pelo Trimble Geomatics Office, selecione o arquivo Norte.pgf ou Leste.pgf da pasta Arquivos do programa\Arquivos comuns\Trimble\Geodata.

7.	Pode-se enviar arquivos para a memória principal ou para um PC, se um estiver instalado. Selecione o destino na lista de Destino.

8.	Certifique-se de o campo Formato de arquivo está configurado para Arquivo de trabalho v7.50. Se necessário, selecione esta opção da lista.

9.	Clique Selecionar. O diálogo Abrir fecha e se retorna ao diálogo Transferência de dados. Os arquivos selecionados aparecem na listas Arquivos a mandar.

10.	Clique Transferir. O diálogo Convertendo aparece na medida que os arquivos são convertidos a partir do formato do arquivo do dispositivo. Quando todos arquivos forem convertidos, aparece o diálogo Enviando, mostrando o progresso de exportação dos arquivos selecionados.

Quando a transferência é completada, aparece o diálogo Transferência completada, exibindo os resultados da transferência.

NOTA: Se estiver transferindo dados para a ou da versão 7.60 do Survey Controller, use o formato de arquivo .dc da versão 7.50.


Para calibrar usando coordenadas salvadas de calibração e coordenadas ajustadas (derivadas do módulo de Ajustes da Rede)

1.	Depois de ter completado um ajuste minimamente limitado e estabelecido as coordenadas WGS-84 em cada um dos pontos do ajuste da rede, salve estas coordenadas para uso como coordenadas GPS como observadas para uma calibração do local. As coordenadas de calibração consistem em Latitudes, Longitudes e Alturas do Elipsóide do WGS-84.

Para salvar as coordenadas da calibração

  Selecione Ajuste / Coordenadas da Calibração / Salvar.

Aparece o diálogo Salvar coordenadas da calibração.

NOTA: Este comando somente é disponível quando o WGS-84 está selecionado como seu datum de ajuste e houveram somente observações GPS, incluídas no ajuste anterior.

NOTA: Se os parâmetros de transformação do ajuste foram criados durante um ajuste, eles são descartados quando se efetua uma calibração de local GPS. O Trimble Geomatics Office somente permite um ou outro.

2.	Selecione uma das seguintes opções:

  A opção Criara coordenadas sob pontos existentes

   A opção Criar coordenadas sob pontos novos com sufixo

3.	Clique OK. As coordenadas da calibração são salvadas.

NOTA: Uma coordenada WGS-84 é criada para cada ponto do ajuste. Pode-se visualizar isso na janela de Propriedades. Esta coordenada não pode ser editada.

4.	Execute um ajuste limitado no datum do projeto (para saber como fazer isso, consulte os tópicos de ajuda apropriados do Ajuste da Rede). Os valores ajustados são salvados no banco de dados.

NOTA: Uma coordenada de grid ajustada é criada para cada ponto não limitado no ajuste. Esta coordenada pode ser visualizada na janela Propriedades.

5.	Execute uma calibração do local GPS usando os pares de pontos derivados do Ajuste da Rede. Para fazer isso, Selecione Levantamento / Calibração do site GPS. Aparece o diálogo Calibração do site GPS.

6.	No grupo de componentes da calibração, selecione os parâmetros da calibração que queira calcular.

7.	Clique Lista de Ponto. Aparece o diálogo Lista de Ponto.

8.	Use o diálogo Lista de Ponto para selecionar os pares de ponto (ponto GPS e ponto do grid) para a calibração. Escolha uma das seguintes opções:

  Use o preenchimento de campo ou insira o nome da coordenada de calibração salvada no campo Ponto GPS.

  Use preenchimento de campo ou insira o nome da coordenada ajustada que combina no campo Ponto do Grid.

Se a coordenada minimamente limitada foi salvada sob o mesmo ponto, o campo do ponto do grid será preenchido automaticamente. Quando o ponto GPS é inserido, os valores mostrados são provenientes das coordenadas de calibração salvadas. Quando o ponto do grid é inserido, os valores ajustados são selecionados.

9.	Repita o passo acima para selecionar todos os pares de ponto que você requer na calibração.

10.	Quando tiver selecionado todos pares de ponto, clique Fechar para voltar ao diálogo de Calibração do site GPS.

11.	Clique Computar para calcular os parâmetros de calibração. Os resultados da calibração aparece no grupo sumário da Calibração.

12.	Clique OK para aplicar a calibração ao projeto. O sistema de coordenadas é atualizado com os parâmetros da calibração. Agora pode-se transferir a calibração para o Trimble Survey Controller.


Para apresentar um relatório e exportar eventos

Pode-se definir um relatório ou formato de exportação para registrar o horário em que um evento foi registro pelo receptor.

Para apresentar relatórios sobre eventos, crie um relatório personalizados do banco de dados:

1.	Selecione pontos com registros de eventos no Trimble Geomatics Office. Para fazê-lo

(a) Escolha Selecionar / Pontos. Aparece o diálogo Selecionar Pontos

(b) Selecione a guia GPS

(c) Da lista Métodos de campo, selecione Eventos

(d) Clique OK

Todos os pontos com registros de eventos são selecionados

2.	Selecione Relatórios / Relatórios adicionais. Aparece o diálogo Relatórios adicionais.

3.	Escolha uma das seguintes opções:

  Clique Editar para modificar um formato de relatório existente

  Clique Novo para criar um novo formato de relatório.

Aparece o diálogo Definir Formato do Relatório.

4.	No campo Formatar corpo, clique o lado direito do mouse para acessar o menu de atalho e então selecione Avançado / Subregistros / Obs do ponto / Hora.

Para exportar eventos para definições de exportação personalizadas:

1.	Selecione o diálogo Arquivo/Exportar.

2.	Na guia Personalizar, escolha uma das seguintes opções:

  Clique Editar formato para modificar um formato existente.

  Clique Novo formato para criar um novo formato de relatório.

Aparece o diálogo Definir Formato de Exportação ASCII.

3.	No campo Formatar corpo, clique o lado direito para acessar o menu de atalho e selecionar Avançado / Subregistros / Obs do ponto / Hora.


Esquemas do formato da hora

O formato típico de visualização da hora para eventos é como segue: 09:12:55 8 Fev 2000

Para mudar este esquema, clique o lado direito do mouse ao lado do código de campo para acessar o menu de atalho e então selecione Avançado / Mais / Esboço do formato. Selecione um esquema amostra para o formato das horas ou crie o seu próprio. Para maiores informações, consulte o tópico Esquemas do formato da hora.

NOTA: Para exibir horários de eventos para o mais próximo milesegundo, adicione o seguinte esquema de formato de hora ao código do campo, <H:mm:ss.nnn>,onde nnn é o número de décimos de segundos. Por exemplo, [Obs do ponto.Hora:<H:mm:ss.nnn>]. Para aumentar a precisão do horário, aumente o número de décimos de segundos. Por exemplo, nnnn produz os primeiros 4 décimos de segundos.


Para copiar dados entres projetos

Para copiar dados de observação entre projetos de da Trimble Geomatics Office, use o Formato Trimble Data Exchange. Não é possível usar a função copiar e colar.

Para copiar dados de observação entre projetos:

1.	No projeto atual do Trimble Geomatics Office, selecione os dados de observação que deseje copiar.

2.	Exporte os dados do projeto atual usando o Formato Trimble Data Exchange:

a.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

b.	Na guia Levantamento, selecione o Formato Trimble Data Exchange e clique OK. Aparece o diálogo Salvar como.

c.	Salve o arquivo.

3.	Crie um novo projeto no Trimble Geomatics Office.

4.	Importe os dados de informação para o novo projeto, usando o Formato Trimble Data Exchange:

a.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

b.	Na guia Levantamento, selecione o Formato Trimble Data Exchange e clique OK. Aparece o diálogo Abrir.

c.	Selecione o arquivo.

Os dados de observação são importados para o seu projeto do Trimble Geomatics Office.

NOTA: Se quiser criar uma cópia de todas observações e pontos do projeto, crie uma cópia que projeta o Trimble Geomatics Office.


Para importar manualmente dados terrestres

Para importar dados terrestres para o Trimble Geomatics Office, use o formato Softdesk Fieldbook. Este formato foi desenvolvido pela Autodesk.

Crie um arquivo no formato Softdesk Fieldbook, usando seus dados terrestres.

Importe o arquivo para o Trimble Geomatics Office:

a.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

b.	Na guia Levantamento, selecione os arquivos de coletores de dados de terceiros. Aparece o diálogo Abrir.

c.	Selecione o arquivo que deseja importar.

d.	A partir do campo Arquivos do tipo, selecione os arquivos do formato Autodesk FBK fieldbook (*.FBK) e clique OK.

O arquivo será importado para o projeto do Trimble Geomatics Office.

NOTA:

O formato Autodesk Softdesk Fieldbook é descrito abaixo. Este formato foi tomado dos arquivos de ajuda do AutoCAD Land Development Desktop.

Considere o seguinte:

  Toda linha de formato que não inicia com um dos comandos reconhecidos será ignorada.

  Itens dentro de parênteses () são opcionais.

  O Trimble Geomatics Office requer que se use um número de ponto.

  A descrição do ponto (descrita) deve ser incluída entre aspas duplas ("), pois é parte do formato da definição de arquivo do formato Fieldbook. Isso significa que espaços podem ser usados na descrição do ponto.


Comandos para criação de ponto

AD (ponto) [ângulo] [distância] (descriç)

AD [VA] (ponto) [ângulo] [distância] [ângulo vert] (descriç)

AD [VD] (ponto) [ângulo] [distância] [distância vert] (descriç)

BD (ponto) [orientação] [quadrante] [distância] (descric)

BD [VA] (ponto) [orientação] [quadrante] [distância] [ângulo vert] (descriç)

BD [VA] (ponto) [orientação] [quadrante] [distância] [distância vert] (descriç)

DD (ponto) [ângulo] [distância] [ângulo vert] (descriç)

DD [VA] (ponto) [ângulo] [distância] [ângulo vert] (descriç)

DD [VD] (ponto) [ângulo] [distância] [distância vert] (descriç)

F1/F2 (ponto) [ângulo] [distância] (descriç)

F1/F2 [VA] (ponto) [ângulo] [distância] [ângulo vert] (descriç)

F1/F2 [VD] (ponto) [ângulo] [distância] [distância vert] (descriç)

NE (ponto) [Norte] [Leste] (descriç)

NEZ (ponto) [Norte] [Leste] (elev) (descriç)

NE SS (ponto) [Norte] [Leste] (elev) (descriç)

PRISM [altura]

PT OFFSET (ponto) [offset] (adiante)

STADIA (ponto) [ângulo] [distância] [rod] (ângulo vert) (descriç)

ZD (ponto) [azimute] [distância] (descript)

ZD [VA] (ponto) [azimute] [distância] [vert angle] (descriç)

ZD [VD] (ponto) [azimute] [distância] [vert distance] (descriç)


Comandos do local do ponto

AZ [ponto 1] [ponto 2] [azimute]

BS [ponto] (orientação)

STN [ponto] (altura inst.) (descriç)


Comandos de correção do equipamento

ÂNGULOS [DIREITA, ESQUERDA] [ZÊNITE, NADIR, HORIZ]

ATMOS [LIG, DESL]

CR [LIG, DESL]

EDM OFFSET  [offset]

ÂNGULO HORIZ [DIREITA, ESQUERDA]

PRESS [pressão] [PÉS, MBAR, MM]

SF [fator]

CONSTANTE PRISMA  [constante]

OFFSET PRISMA  [offset]

TEMP [temperatura] [F, C, K]

UNIDADES [METRO, PÉS] [DMS, DECDEG, GRAU, MILS, RADIANO]

ÂNGULO VERT [ZÊNITE, NADIR, HORIZ]


Para adicionar coordenadas à janela Propriedades

O Trimble Geomatics Office lhe permite adicionar coordenadas para um ponto na janela Propriedades, usando a ferramenta Adicionar Coordenadas [image] na página Sumário.

Para fazê-lo:

1.	Clique duas vezes o ponto do projeto. Aparece a janela das Propriedades.

2.	Na página Sumário, selecione [image] e então selecione o tipo de coordenadas que necessita adicionar; isto é, grid, local ou WGS 84.

Na estrutura de árvore da janela Propriedades, uma nova coordenada aparece sob o ponto selecionado. Um prefixo é adicionado ao nome para denotar se a coordenada é um grid (G), coordenada local (L) ou WGS-84 (W). A página sumário para a nova coordenada exibe todos os campos como nulos.

NOTA: Somente pode-se inserir uma coordenada WGS-84 e um grid ou coordenada local para cada ponto. Quando se adiciona uma coordenada WGS-84, esta opção não fica mais disponível na lista de Adicionar coordenada. Se um ponto já tiver tanto uma coordenada  WGS-84 e um grid ou coordenada local, o botão de Adicionar coordenada não fica mais disponível.

3.	Para popular os campos Norte, Leste, Elevação e Altura para a coordenada, clique em cada campo e então clique o botão Inserir valor atual [image]. Cada campo é preenchido com a posição atual do ponto e qualidade. Pode-se então editar estas informações, como requerido.

SUGESTÃO: Somente adicione uma coordenada quando tiver certeza de que quer usar esta coordenada ao invés de observações. As recomputações usam coordenadas digitadas em preferência às observações de mesma qualidade. Isso garante que um ponto de desenho é usado em preferência a uma observacão piquetada.

NOTA: Mais coordenadas podem ser geradas pelo Trimble Geomatics Office e armazenadas para um ponto. Estas coordenadas podem incluir:

  Coordenadas derivadas de um ajuste

  Coordenadas WGS-84 salvadas para calibração


Para editar coordenadas na janela Propriedades

 Perspectiva geral e Mais informações

O Trimble Geomatics Office lhe permite editar as coordenadas para um ponto na janela Propriedades.

Para fazê-lo:

1.	Clique duas vezes o ponto do projeto. Aparece a janela Propriedades.

2.	Na estrutura de árvores da janela Propriedades, expanda a estrutura para o ponto e selecione a coordenada digitada (WGS-84 ou grid/local) que deseja editar.

3.	Edite os componentes da coordenada e a qualidade da coordenada.

NOTA: Para que o campo da coordenada seja editável, a configuração da visualização da coordenada e a configuração do Tipo de coordenada devem ser os mesmos.

4.	Após a edição da coordenada, selecione Levantamento / Recomputar para executar a recomputação.

Para maiores informações sobre a adição e edição das coordenadas na janela Propriedades, consulte o tópico janela Propriedades - Coordenadas.


Para importar arquivos de nível digital

O diálogo Importação do nível digital aparece quando se importam arquivos do nível digital (*.dat, *.raw) ou faz o download de arquivos usando um nível digital DiNi (usando dispositivos de levantamento). Para fazê-lo:

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione Arquivo do nível digital (*.dat, *.raw) e clique OK. Aparece o diálogo Abrir.

3.	Selecione o arquivo Nível digital. Aparece o diálogo Importação do nível digital.

4. 	No diálogo Importação do nível digital, defina pontos da estação marcando a caixa de seleção na coluna Pontos da estação.

Elevações Delta são computadas entre pontos da estação. Quando pontos da estação são importados, eles serão unidos a outros pontos do mesmo nome. Tenha certeza de que os nomes do ponto sejam únicos. Pode-se editar nomes de ponto no diálogo Importação do nível digital.

NOTA: Pontos que não são definidos como pontos de estação, não serão importados.

5. 	No diálogo Importação do nível digital, insira uma elevação para pontos iniciais. Esta elevação é usada para computar elevações para outros pontos. Para editar elevações iniciais de pontos, clique em qualquer ponto do círculo. A elevação do ponto inicial para o círculo é ilustrada no grupo Elevação. No grupo Elevação, edite a elevação e qualidade e clique Enter. A elevação será computada para todos pontos da estação. Use estas elevações computadas para verificar com valores conhecidos e validar dados.

NOTA: Elevações com o símbolo de elevação são as únicas elevações importadas. Todos outros pontos da estação terão importadas elevações delta. As suas elevações serão computadas durante a recomputação.

SUGESTÃO: Todas mudanças efetuadas no diálogo Importação do nível digital somente afeta os dados que são importados. As mudanças não afetam os Arquivos do nível digital (*.dat, *.raw).

6.	Clique OK. O arquivo do nível digital é importado.

NOTA: As observações que são importadas podem não ter coordenadas horizontais e podem não aparecer na janela de gráficos. Para visualizar o nível de dados da janela Propriedades, selecione as observações de nível usando uma das ferramentas de seleção e então abra a janela Propriedades. Para fazer isso, escolha uma das seguintes opções::

  Selecione Editar / Propriedades

  Selecione a ferramenta janela Propriedades [image] na barra de ferramenta.

SUGESTÃO: Quando se coletam dados do nível digital, a Trimble recomenda que se armazene os pontos que queira importar no Trimble Geomatics Office com um único prefixo ou sufixo. Por exemplo, armazene todos os pontos que queira usar como pontos de estação com o sufixo, STN. Isso torna mais fácil selecionar pontos usando o botão  Selecionar por filtro diálogo Importação do nível digital.


Para visualizar um mapa de fundo no Trimble Geomatics Office

 Perspectiva geral e Mais informações

Para visualizar um mapa de fundo no Trimble Geomatics Office:

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções de visualizações.

2.	Na guia Mapa de fundo, clique Adicionar. Aparece o diálogo adicionar.

3.	Selecionar o arquivo Mapa de fundo e clicar OK.

NOTA: O Trimble Geomatics Office pode exibir arquivos de fundo na janela de gráficos. Pode-se importar arquivos Drawing Exchange Format (.dxf), Windows Bitmap (.bmp) ou Tagged Image File Format (.tif) para exibição. Os arquivos Windows Bitmap (.bmp) e Tagged Image File Format (.tif) devem ser referenciados geograficamente para que possam ser visualizadas corretamente. O formato de arquivo ESRI’s World é usado para referenciar geograficamente arquivos de fundo. Estes arquivos devem estar na mesma pasta dos arquivos de fundo correspondentes.

O arquivo Mapa de fundo aparece no Trimble Geomatics Office.

Para maiores informações sobre o uso do mapa de fundo no Trimble Geomatics Office, consulte as Opções visualizar – Mapa de fundo.


Para visualizar as linhas do grid do Trimble Geomatics Office

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções da visualização.

2.	Na guia Linhas do grid, marque a caixa de seleção Mostrar linhas do grid. As opções deste grupo tornam-se disponíveis.

3.	Selecione as opções Número fixo da linhas do grid ou Intervalo do grid, e insira os valores apropriados em cada campo.

4.	Selecione o tipo e a cor da linha do grid.

5.	Se desejar etiquetar as linhas do grid, marque a caixa de seleção Linhas do grid da etiqueta.

6.	Clique OK.


Para selecionar linhas de base independentes

Uma linha de base independente consiste em um número mínimo de linhas de base requerido para conectar todos os pontos de ocupação em uma determinada sessão GPS de campo. Para qualquer dado grupo ocupações n simultâneas de ponto GPS, existem n – 1 linhas de base independentes. Por exemplo, numa sessão de campo com cinco receptores, existem 10 linhas de base possíveis, mas somente 4 linhas de base independentes. No diagrama abaixo, as linhas de base independentes são representadas por linhas intermitentes.

O conceito de um grupo de linhas de base independentes aplica-se, primariamente, a levantamentos conduzidos usando técnicas estáticas e “FastStatic”, que são importantes para projetos que incluem ajuste de rede.

O uso de grupos de linha de base independentes garante que o ajuste da rede não seja afetado por um sentido artificial de redundância (Graus de liberdade inflacionados), que podem resultar numa subestima do erro nas coordenadas ajustadas.

As linhas de base derivadas de sessões de campo GPS que usam mais de dois receptores, podem ser formadas em grupos múltiplos de linhas de base independentes. A escolha de linhas de base incluídas no grupo independente pode ser baseada na qualidade das soluções da linha da base ou na obtenção de uma geometria de rede desejada.

Para especificar um grupo de linhas de base independentes, escolha uma das seguintes opções:

  Selecione e processe somente um grupo independente de linhas de base dentre todas potenciais linhas de base para uma sessão de campo GPS.

  Processe todas linhas de base potenciais para uma sessão de campo GPS e selecione um grupo independente no momento em que os resultados são salvados no projeto.

  Processe todas as linhas de base potenciais para uma sessão de campo GPS e salve todos os resultados para o projeto e remova as linhas de base dependentes de consideração pelos ajustes da rede.

Para fazer isso, use a ferramenta para visualizar a Linha de base dependente [image] para ligar as observações da janela de gráficos com a linha do tempo. Quando selecionar esta ferramenta, o software somente mostra as linhas de base pós-processada dentro da atual visualização da linha do tempo e as linhas de base pós-processadas que foram observadas ao mesmo tempo. Todas outras linhas de base pós-processadas da visualização do processamento ficam ocultas. Use a ferramenta da linha de base dependente para exibir linhas de base que foram observadas ao mesmo tempo e depois evitar que linhas de base dependentes sejam usadas num ajuste.

Para fazer isso, escolha uma das seguintes opções:

  Na janela Propriedades, mude as linhas de base dependentes para Desativado.

  Na janela Propriedades, mude o status das linhas de base dependente para Ativar como verificação.

  Na janela Propriedades, desmarque a caixa de seleção Usar em ajuste de rede para as linhas de base dependentes.

  Use o diálogo Observações para desmarcar a caixa de seleção Usar para linhas de base dependentes.

A melhor maneira de efetuar estas operações é através do uso do diálogo Editar multiplamente. Por exemplo, para mudar o status de linhas de base dependentes para Desativado:

1.	Selecione a ferramenta de visualização da linha de base dependente.

2.	Selecione as linhas de base dependentes na janela de gráficos.

3.	Selecione Editar / Editar multiplamente. Aparece o diálogo Editar multiplamente.

4.	Marque a caixa de seleção Configurar status da observação para.

5.	Na lista, marque Desativado e clique OK.

As observações selecionadas agora terão o status de desativado.


Para importar arquivos Trimble 3600/5600 GDM

NOTA: Quando dados de levantamento são contidos tanto no trabalho como no arquivo da área, importe antes o arquivo Área.

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione arquivos Trimble 3600/5600 GDM (*.job, *.are) e clique Opções. Aparece o diálogo Configurações.

3.	Especifique as configurações para a unidade de controle de Trimble 3600/5600 GDM e configurações de pontos duplicados.

4.	Clique OK para aceitar quaisquer mudanças e voltar ao diálogo Importar.

5.	Clique OK. Aparece o diálogo Abrir.

6.	Selecione o arquivo a ser importado e clique Abrir.

NOTA: O Trimble Geomatics Office deduz que todos os arquivos 3600/5600 GDM são definidos como um Sistema de coordenadas somente fator escala. Para maiores informações, ver Somente fator escala.

Ver também


Para exportar para um arquivo de Área do Trimble 3600/5600 GDM (*.are)

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione arquivos Trimble 3600/5600 GDM (*.are) e clique Opções. Aparece o diálogo Configurações.

3.	Especifique as configurações da unidade de controle do Trimble 3600/5600 GDM.

4.	Clique OK para aceitar quaisquer mudanças e voltar para o diálogo Exportar.

5.	Clique OK. Aparece o diálogo Salvar como.

6.	Especifique um nome de arquivo e local e clique Salvar (por padrão, o nome do projeto determina o nome do arquivo).

NOTA: Coordenadas exportadas para o arquivo Área usam o sistema de coordenadas definido no projeto do Trimble Geomatics Office.

Ver também


Para exportar um arquivo Pcode (*.pco) para um instrumento Trimble 3600/5600

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione arquivo Pcode para Trimble 3600/5600 GDM (*.pco) e clique OK.

Aparece o diálogo Selecionar.

3.	Selecione um arquivo Pcode e clique Abrir. Aparece o diálogo Data Transfer Salvar como.

4.	Selecione um dispositivo Trimble 3600/5600 GDM e clique Abrir. Aparece o diálogo Conectando. Quando a conexão é feita, aparece o diálogo Salvar.

5.	Clique Salvar. Um diálogo mostra o progresso da transferência de arquivos. Quando a transferência estiver completada, a conexão ao dispositivo é interrompida.

Ver também


Importação - Perspectiva Geral

Maiores Informações

Como ...	Diálogo	Ver também

Perspectiva Geral

Pode-se importar dados numa série de formatos de arquivo para um projeto do Trimble Geomatics Office. Por exemplo, pode-se importar arquivos que contenham pontos de controle, arquivos GPS não processados (*.dat), arquivos do Survey Controller (*.dc) e formatos personalizados.

Para uma descrição dos formatos de importação suportados, consulte o tópico diálogo Importar.

Pode-se importar dados de:

  um dispositivo que execute o Trimble Survey Controller

  um receptor GPS da Trimble

  um arquivo num computador

  uma estação total

  um nível digital

Quando um arquivo é importado, os pontos do arquivo são adicionados no banco de dados. Se um ponto é importado com o mesmo nome do ponto que já está no banco de dados, o modo em que os pontos serão unidos vai depender da opção especificada no diálogo Duplicar opções do ponto.

O que acontece quando se importa um arquivo depende do tipo do arquivo. No entanto, para todos tipos de arquivo, uma recomputação é efetuada automaticamente um relatório de importação (com nome <nome do arquivo importado>.html) é criado e armazenado na pasta de Relatórios do projeto.

Todas entidades importadas de um arquivo são salvadas num grupo de seleção. Com arquivos .dc, o grupo de seleção recebe o nome de acordo com o nome do trabalho interno do arquivo. Com outros tipos de arquivo, o grupo de seleção recebe o nome do arquivo de importação. Para administrar grupos de seleção, use o comando Selecionar / Grupos de seleção.

SUGESTÃO: Para visualizar somente dados num grupo de seleção, use a opção Exibir somente dados no grupo de seleção do diálogo Visualizar filtros .

SUGESTÃO: Para inverter uma operação de importação, use o comando Desfazer o comando. Se tiver fechado o projeto depois de uma importação, use a opção Da fonte do diálogo Selecionar pontos / guia Geral e apague a seleção para desfazer a operação de importação.

NOTA: Se importar um arquivo mais de uma vez para o mesmo projeto, o arquivo será adicionado na pasta apropriada, com um hífen e um número no final do nome do arquivo. Por exemplo, se importar um arquivo GPS não processado da Trimble (.dat) chamado MeuArquivoGPS duas vezes, cria-se uma pasta chamada MeuArquivoGPS (durante a primeira importação do arquivo). Nesta pasta, os arquivos serão chamados MeuArquivoGPS.dat e MeuArquivoGPS-1.dat. Dados duplicados são identificados na importação e não adicionados ao banco de dados.


Diálogo Importar

Use este diálogo para importar dados para o seu projeto.

Para acessá-lo, escolha uma das seguintes opções:

  Selecione Arquivo / Importar.

  Clique o botão Importar [image] da barra de ferramentas padrão.

Os formatos de Importação são organizados em três guias:

  Levantamento

  CAD / ASCII

  Personalizar

Novo formato

Este botão torna-se disponível quando se seleciona a guia Personalizar.

Para criar um novo formato personalizado, clique em Novo formato. Aparece o diálogo Definir Formato de Importação ASCII.

Use este diálogo para definir o formato de importação.

Editar formato

Este botão torna-se disponível quando a guia Personalizar é selecionada.

Clique Editar formato para modificar formatos existentes de importação ASCII.

Aparece o diálogo Definir Formato de Importação ASCII.

Use este diálogo para editar o formato de importação.

Apagar formato

Este botão torna-se disponível quando a guia Personalizar é selecionada.

Clique Apagar para apagar um formato de importação personalizado. Lhe será pedido que confirme esta ação.

Para confirmar, clique Sim.

Personalizar

Use o botão Personalizar para selecionar a lista de opções de importação exibidas no diálogo Importar. Selecione as opções requeridas de impotação a partir da lista de verificação.

Pode-se adicionar um filtro externo do diálogo Personalizar. Filtros externos são programas separados que podem ser gravados para integração com o Trimble Geomatics Office. Todos arquivos externos escritos para serem usados no Trimble Geomatics Office devem condizer com requerimentos específicos se tiverem que ser adicionados ao sistema. Somente aparecem os filtros instalados para a guia selecionada no diálogo Importar.

Todo programa de filtro deve ser compilado como um arquivo de Dynamically Linked Library (*.dll), com funções específicas exportadas e deve ser criado como um objeto COM (Módulo do Objeto Componente).

Uma vez que tenha selecionado o arquivo apropriado, o Trimble Geomatics Office registra o objeto COM do filtro no computador e verifica se a interface .dll está conforme os requerimentos do sistema. Se isso não tiver êxito, o sistema relata que não é capaz de registrar o filtro. Se o filtro for instalado com êxito, a descrição curta do filtro é listada no diálogo.

Para maiores informações, consulte Arquivos externos de Importação/Exportação.

Opções

Para o arquivo importado, clique o botão Opções para:

  especificar como administrar pontos duplicados na importação.

  configurar a qualidade para os dados de importação.

  especificar as unidades de dados importados.

  especificar as configurações do arquivo importado.

  mudar as opções para importação de dados para um dispositivo, 3300/3600/5600 Elta M5, ou 3600/5600 GDM.

Se você selecionar um sistema de coordenadas que seja diferente daquele que está sendo usado para o projeto, o Trimble Geomatics Office lê o arquivo, converte as coordenadas para o sistema de coordenadas do projeto, armazena os pontos e exibe-os no sistema de coordenadas do projeto. O arquivo de dados permanece o mesmo.

NOTA: Os valores das coordenadas visualizados no Trimble Geomatics Office para pontos importados do arquivo de dados podem diferir daqueles no arquivo.


Formatos de Importação - guia de Levantamento

 Perspectiva Geral e Maiores informações

Use a guia Levantamento para importar dados do Trimble Survey Controller, um receptor GPS da Trimble, um instrumento Trimble 3600/5600, uma estação total, um nível digital ou arquivos de dados de levantamento num computador.

Para acessar a guia Importar / Levantamento:

1.	Selecione Arquivo / Importar.

2.	Selecione a guia Levantamento.

Pode-se mover formatos personalizados para esta guia. Para maiores informações, consulte arquivo Asciiimp.dat.

NOTA: Também pode-se usar a função arrastar e soltar para importar arquivos.

Use a guia Levantamento para importar os seguintes formatos:

Formato	Use este formato para importar …
Arquivos do nível digital (*.dat, *.raw)	Arquivos do nível digital
Arquivos de dados GPS (*.dat)	Arquivos de dados GPS da Trimble do seu computador.
Arquivos DTM de grid (*.dtx)	Um modelo digital de terreno criado com o uso do software DTMLink.
Arquivos da folha de dados NGS (*.dat, *.dsx, *.htm, *.html)	Arquivos de dados do formato “National Geodetic Survey” (NGS).
Formato Trimble Data Exchange	Um arquivo ASCII com dados do formato Trimble Data Exchange. Este formato é usado principalmente para transferir dados de levantamento para outros pacores de software.
Arquivos de efeméride precisa (*.sp3, *.e18)	Um arquivo do formato efeméride para usar para processamento de linha de base. Este arquivo é armazenado na área de Arquivos comuns. Para selecioná-lo, use o diálogo Estilos de processamento GPS.
Arquivos RINEX (*.Xxo, *.XXn, *.obs, *.nav)	Arquivos do formato Receiver Independent Exchange. Este formato lhe permite transferir arquivos de dados GPS não processados de receptores GPS de qualquer fabricante. Requer-se tanto um arquivo de navegação como um arquivo de observação na mesma pasta.
Arquivos do dispositivo Sokkia (*.sdr)	Um arquivo do formato Dispositivo Sokkia de um computador.
Arquivos SSF/SSK (*.ssf, *.ssk)	Arquivos da solução cinemática pós-processada ou arquivos de solução estática pós-processada criados com o uso do Trimble GPSurvey.
Arquivos Survey Controller (*.dc)	Um arquivo do formato de Trimble Survey Controller de um computador. Quando arquivos .dc são importados, todos vetores ou observações GPS com antena, instrumento e alturas de prisma associados são armazenados no projeto. Estes dados são usados para computar
Dispositivos de levantamento	dados diretamente de estações totais suportadas, dispositivos, cartões de dados de levantamento, níveis digitais e receptores GPS.
Arquivos de registro de dados de terceiros	Arquivos de registro de dados de terceiros fornecidos que usam um filtro de importação/exportação. Os seguintes formatos de terceiros são fornecidos com o Trimble Geomatics Office: Leica GS1-16 SDMS (importa pontos de coordenadas) dados Nikon AP-700 ASCII Topcon GTS-700 e dados de formato FC-5
Arquivos Trimble 3600/5600 GDM (*.job, *.are)	Arquivos de dados Trimble 3600/5600 GDM
Arquivo de trabalho TDS Survey Pro CE (*.job)	Importa arquivos de trabalho TDS Survey Pro CE
Arquivo não processado TDS Survey Pro CE (*.raw)	Importa arquivos não processados TDS Survey Pro CE
Arquivos Trimble 3300 / 3600 / 5600 Elta M5 (*.dat)	Importa um arquivo 3300 / 3600 / 5600 Elta M5
Arquivo Trimble 3600 / 5600 TDS Coord (*.cr5)	Importa arquivos Trimble 3600 / 5600 TDS Coord
Arquivo não processado Trimble 3600 / 5600 TDS (*.rw5)	Importa arquivos não processados Trimble 3600 / 5600 TDS
Arquivos Trimble Elta GPS Controller M5 (*dat)	Importa arquivos Trimble Elta GPS Controller M5


Opção arquivos da folha de dados NGS (*.dat, *.dsx, *.htm, *.html)

Pode-se importar arquivos de dados do formato padrão do “National Geodetic Survey” (NGS).

O Trimble Geomatics Office considera que todos dados NGS importados para um projeto são do datum NAD-83 (isto é, condizem com um datum WGS-84).

Se você importar dados NGS para um projeto que não seja baseado de forma reconhecível num datum NAD-83, o Trimble Geomatics Office não pode certificar-se se os dados NGS são apropriados.

NOTA: O Trimble Geomatics Office reconhece um datum NAD-83 por nome (isto é, qualquer NAD-83 que inicie o datum).

Se o seu datum não for equivalente ao NAD-83, aparece a seguinte mensagem de aviso:

Seu projeto parece não estar num datum NAD 1983. Isso causará problemas pois os dados que estão sendo importados estão num datum NAD 1983 e não será tentado uma conversão para o datum do projeto.

Deseja continuar com a importação?

AVISO: Se decidir continuar a importação, as coordenadas do NGS serão interpretadas usando o datum definido para o projeto. Se este datum não for equivalente ao NAD-83, esta interpretação será incorreta.


CAD / Formatos de Importação de ASCII

Para acessar a guia Importar / CAD/ASCII:

1.	Selecione Arquivo / Importar.

2.	Selecione a guia CAD/ASCII.

NOTA: Qualquer formato de importação que lida com arquivos ASCII sempre espera receber dados numéricos em formato padronizado. Formato padronizado não inclui nenhum separador ou vírgula decimal.

Pode-se passar formatos padrões para esta guia. Para maiores informações, consulte o arquivo Asciiimp.dat.

NOTA: Também pode-se usar a função arrastar e soltar para importar arquivos.

Use a guia CAD/ASCII para importar os seguintes formatos:

Formato	Use este formato para importar …
Arquivo AutoCAD (*.dwg, *.dxf)	Pontos de coordenadas e trabalho de linha usando arquivos ASCII binários .dxf e .dwg (até o Lançamento 14 do .dxf).
Formato padrão C & G	um arquivo padrão ASCII do software C & G.
C & G sem citações	um arquivo ASCII do software C & G sem citações.
Arquivos CMM COR e LEV (*.cor, *.lev)	arquivos padrão do formato ASCII usados pelo “Bureaux of Land Management”. A opção de arquivos CMM COR e LEV é fornecida usando um filtro externo de importação.
Arquivo NMEA	pontos de arquivos do formato NMEA (seqüências GGA, GGK e PJK). NMEA é um padrão desenvolvido pela “National Marine Electronics Association” que define formatos de dados para comunicação de dados de navegação entre instrumentos de navegação marinha.
Formato Pacsoft	um arquivo ASCII padrão do software Pacsoft.
Coordenadas SDRmap	um arquivo de texto de coordenadas SDRmap.
TPLANE (LLHE)	um arquivo ASCII Trimble GPSurvey.
Arquivo de gráficos TRIMMAP (*.tgf)	um arquivo TRIMMAP (ou SDRmap) *.tgf.
Formato WILDsoft	um arquivo ASCII padrão do software WILDsoft.
Arquivos do Projeto Terramodel (*.pro)	pontos, trabalho de linha e camadas dos arquivos de Projeto do Terramodel.


Formatos de Importação Personalizados

Para acessar a guia Importar / Personalizar:

1.	1.	Selecione Arquivo / Importar.

2.	2.	Selecione a guia Personalizar.

NOTA: Alternativamente, use a função arrastar e soltar para importar arquivos.

Pode-se mover formatos personalizados para outras guias. Para maiores informações, consulte o arquivo Asciiimp.dat.

Use a guia Personalizar para:

  importar arquivos de dados num formato personalizado

  adicionar novos formatos personalizados de importação

  editar formatos personalizados existentes de importação

  apagar formatos personalizados de importação.

Os seguintes formatos personalizados são fornecidos:

  Pontos delimitados

  Pontos de largura fixa

  Nome,Leste,Norte,Elevação,Código

  Nome,Latitude,Longtitude,Altura,Código (Local)

  Nome,Latitude,Longtitude,Altura,Código (WGS-84)

  Nome,Norte,Leste,Elevação,Código

Quando estiver importando valores de um arquivo ASCII, o Trimble Geomatics Office pode ler valores que usam o símbolo de agrupamento de dígitos e símbolo decimal definido no Painel de Controle / Configurações regionais / guia Número do Microsoft Windows. O sistema também lerá em valores num formato padronizado. Isto é, sem nenhum símbolo de agrupamento de dígitos (separador de milhares) e vírgula decimal.

Todos formatos personalizados de importação são escritos no arquivo Asciiimp.dat.


Diálogo Definir Formato de Importação ASCII

 Perspectivas Gerais e Maiores Informações

Use este diálogo para definir formatos de importação ASCII.

Para acessá-lo:

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Personalizar, escolha uma das seguintes opções:

  Para criar um novo formato, clique Novo formato.

  Para modificar um formato existente, clique Editar formato.

Nome

Inserir o nome do formato de importação.  Este nome aparece na lista de Tipos da guia Personalizar do diálogo Importar. Não se permitem nomes duplicados.

Seqüência nula

Insira a seqüência nula para a definição do formato de importação. Este campo é opcional. A seqüência nula especificada aqui é interpretada durante a importação de um arquivo para indicar que não existe um valor disponível para um determinado registro.

Se o Trimble Geomatics Office encontrar a seqüência nula especificada, ele não designa nenhum valor ao campo do banco de dados apropriado na medida em que dados são adicionados ao banco de dados.

NOTA: Alguns tipos de arquivo podem requerer uma seqüência especial, tal como “99999,99”, ‘*****’ , ou parecida. Ao especificar a configuração, pode-se pedir ao Trimble Geomatics Office que use a sua preferência.

Descrição

Insira uma descrição ao formato de importação. A descrição aparece na barra de status quando o formato é realçado no diálogo Importar. Este campo é opcional.

Extensão padrão

Insira a extensão padrão para o formato de importação. Por exemplo, .dat ou .fbk. Este campo é opcional e, se omitido, considera-se como sendo “.txt”.

SUGESTÃO: Para aceitar todas extensões de arquivo, insira ‘???’

NOTA: O Trimble Geomatics Office usa a extensão do campo Listar arquivos do tipo, do diálogo Abrir. Ele põe os nomes dos arquivos com a extensão especificada na lista de Nomes. O Trimble Geomatics Office considera automaticamente que há um ponto entre o nome e uma extensão.

Importar como

Selecione o tipo de registro apropriado como o destino para os dados nos arquivos importados. Isso geralmente é a tabela de Pontos.

Preencher Formato Automaticamente

Clique em Preencher formato automaticamente e aparece o diálogo Inserir Formato. Use este diálogo para inicializar automaticamente o título do formato e definições do corpo. Para maiores informações, consulte Preencher formato automaticamente.

Formato do cabeçalho

Usando os códigos de campo disponíveis no menu de atalho, pode-se construir uma definição para condizer ou saltar a parte inicial fixa de um arquivo de importação. A definição do cabeçalho é usada uma vez (e somente uma vez) pelo Trimble Geomatics Office no início do arquivo. Se as linhas do cabeçalho de um arquivo de importação não condizerem com a definição, então a leitura do arquivo será interrompida. Isso é útil para a verificação do formato do arquivo.

NOTA: Para adicionar linhas em branco na definição do cabeçalho, pressione Ctrl+Enter.

Por exemplo, uma definição de cabeçalho que consista dos códigos de campo [$Skip.Line:7] faz com que o Trimble Geomatics Office salte as primeiras sete linhas de um arquivo e interprete o restante como definido pelo corpo do formato.

Formato do corpo

Utilizando os códigos de campo disponíveis no menu de atalho, pode-se construir uma definição que condiga com os dados do arquivo a ser lido. Se os dados relacionados à uma única entidade forem definidos em múltiplas linhas, isso é lidado na definição pressionando Ctrl+Enter para iniciar uma nova linha de definição.

Para maiores informações sobre todos os campos disponíveis do sistema, consulte Códigos de campo – Perspectiva geral.

Na medida que um arquivo é importado, o Trimble Geomatics Office tenta, repetidamente, interpretar as linhas lidas nos códigos de campo da definição. Se o conteúdo do arquivo de importação não combinar com a definição, o desacordo será registrado no relatório de Importação e o programa tentará, então, encontrar mais dados no arquivo que combina com a definição.

NOTA: O Trimble Geomatics Office inicia automaticamente a definição do Corpo do Formato na nova linha, depois da definição do cabeçalho.

Formato das notas de rodapé

Usando os códigos de campo do menu de atalho, pode-se construir uma definição de notas de rodapé para combinar com ou saltar a parte fixa final de um arquivo de importação.

A definição das notas de rodapé é usada somente uma vez pelo Trimble Geomatics Office, no final do arquivo. Se as linhas das notas de rodapé de um arquivo de importação não combinarem com a combinação, a leitura do arquivo é interrompida. Isso é útil para a verificação do formato do arquivo.

NOTA: Para adicionar linhas em branco nas definições das notas de rodapé, pressione Ctrl+Enter.

O Trimble Geomatics Office inicia automaticamente a definição de Formatar notas de rodapé numa linha nova depois da definição do corpo.

Por exemplos de importação personalizada de ASCII, consulte Personalizar formato de importação ASCII - Exemplos.


Personalizar formato de importação ASCII - Exemplos

Ver também
Estes exemplos mostram como se devem definir alguns formatos de importação ASCII.

Exemplo 1

Para ler um arquivo com as seguintes linhas nele:

Versão do Formato do Arquivo 1.00

Data: 8/11/99

Projeto: Exemplo

1000,534247.541,263104.807,10.118,EST

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,ÁRVORE

1026,534222.218,263095.934,10.136,ÁRVORE

1027,534224.816,263092.579,10.140,POSTE

1028,534228.398,263089.101,10.732,CERCA

1041,534236.948,263084.989,11.054,CERCA

1042,534237.326,263087.964,10.982,CERCA

1087,534243.575,263099.773,10.154,MH

O Cabeçalho de Formato pode ser definido como:

Versão do Formato do Arquivo 1.00	Verifica a primeira linha do arquivo
[$Skip.Line:2]	Salta as próximas duas linhas que possuam conteúdo não definido

O Corpo do Formato será definido como:

[Nome],[Leste],[Norte],[Elevação],[Código de Característica]

Exemplo 2

Para ler uma arquivo com as seguintes linhas nele:

1000  534247.541  263104.807      10.118 EST

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 ÁRVORE

1026  534222.218  263095.934      10.136 ÁRVORE

1027  534224.816  263092.579      10.140 POSTE

1028  534228.398  263089.101      10.732 CERCA

1041  534236.948  263084.989      11.054 CERCA

1042  534237.326  263087.964      10.982 CERCA

1087  534243.575  263099.773      10.154 MH

Nenhum Cabeçalho de Formato será definido.

O Corpo do Formato será definido como:

[Nome:4][Leste:12.3][Norte:12.3][Elevação:12.3] [Código de Característica]


Preencher formato automaticamente / Diálogo Inserir formato

Clique Preencher formato automaticamente para inicializar automaticamente as definições do corpo de formatos de importação ou exportação definidos ou relatório do banco de dados definidos pelo usuário. Aparece o diálogo Inserir formato quando se clica o botão.

NOTA: Este botão aparece nos seguintes diálogos:

  Arquivo / Importar / diálogo Definir Formato de Importação ASCII

  Arquivo / Exportar / diálogo Definir Formato de Exportação ASCII

  Relatórios / Relatórios Personalizados / diálogo Definir formato do relatório

O Trimble Geomatics Office cria um grupo padrão de códigos de campo para todos dados envolvidos. Ao usar este padrão inicial como base para o seu novo formato, pode-se modificar a definição, como necessário.

Leiaute

O grupo de leiaute lhe dá controle sobre o formato de relatório ou definição.

NOTA: Uma vez que tenha criado um relatório, pode-se continuar editando-o, usando um editor de HTML.

Largura fixa

Escolha a opção Largura fixa na definição.

NOTA: Nenhuma informação de cabeçalho é criada com esta opção nas definições de Importar ou Exportar.

Delimitado

Escolha a opção Delimitado para inserir os campos. A opção lhe permite especificar o delimitador a ser usado entre os campos do relatório ou definição.

NOTA: Com esta opção, as informações do Cabeçalho padrão são criadas em todos os casos.

Separador de campo

Use o campo Separador de campo para especificar os caracteres que devem ser inseridos entre os campos do relatório ou definição.

SUGESTÃO: O campo fornece padrões, mas pode-se inserir qualquer caractere neste campo.

Delimitador de texto

Use o campo Delimitador de texto para especificar os caracteres a serem adicionados antes e depois de cada campo de texto no relatório ou definição.

SUGESTÃO: O campo fornece padrões, mas pode-se inserir qualquer caractere neste campo.


Exportação - Perspectiva Geral

Como ...	Diálogo	Ver também

Exporte dados do seu projeto se necessitar que os dados estejam num formato diferente. Por exemplo, se desejar usar os dados num pacote diferente de software ou se desejar enviar arquivos para o Trimble Survey Controller.

Pode-se exportar dados numa série de formatos de arquivo de um projeto do Trimble Geomatics Office. Por exemplo, pode-se exportar dados para:

  o Trimble Survey Controller (se quiser que arquivos completem trabalho de campo, por exemplo, bibliotecas de características e atributos)

  uma série de formatos ASCII (se necessitar de dados em outro formato, por exemplo)

  uma série de formatos comuns GIS

  formatos padronizados (e definição de formatos padronizados)

Para uma descrição dos formatos de exportação suportados, consulte o diálogo Exportar.


Diálogo Exportar

Use este diálogo para exportar dados do seu projeto.

Para acessá-lo, escolha uma das seguintes opções:

  Selecione Arquivo / Exportar.

  Selecione a ferramenta Exportar [image].

NOTA: Todo formato de exportação que emite arquivos ASCII sempre emite dados numéricos num formulário padronizado (sem separadores de milhares ou vírgula decimal). Os dados exportados em arquivos ASCII são expressos nas unidades que o Trimble Geomatics Office usa para exibir. No entanto, pode-se especificar diferentes unidades para a exportação na lista unidades para de dados unidades para exportação. Alternativamente, mude as unidades de exibição do Trimble Geomatics Office, selecionando Arquivo / Propriedades do Projeto e selecione a guia Unidades e Formato no diálogo Propriedades do Projeto que aparece.

Para exibir uma descrição do formato de exportação na barra de status, realce o formato de exportação. Os formatos de Exportação são organizados nas seguintes guias:

  Levantamento

  CAD / ASCII

  GIS

  Personalizar

Novo formato

O botão Novo formato torna-se disponível quando a guia Personalizar está realçada.

Para criar um novo formato personalizado de Relatório, clique em Novo formato e use o diálogo Definir Formato de Exportação ASCII para definir o formato de exportação.

Editar formato

O botão Editar formato torna-se disponível quando a guia Personalizar está realçada.

Para modificar um formato existente de exportação ASCII, clique em Editar formato e use o diálogo Definir Formato de Exportação ASCII para modificar o formato de exportação. Para maiores informações sobre a definição de um formato personalizado, consulte os exemplos do tópico Definir Formatos de Exportação ASCII - Exemplos.

Apagar formato

O botão Apagar formato torna-se disponível quando a guia Personalizar é realçada.

Para apagar um formato de exportação, clique em Apagar formato e confirme a sua ação ou cancele-a.

Para confirmar o apagamento, clique em Sim. Se não quiser apagar o formato de exportação, clique Não.

Personalizar

Use o botão Personalizar para selecionar a lista de opções de exportação mostradas no diálogo Exportar. Selecione as opções requeridas de exportação da lista de verificação.

Pode-se adicionar um filtro externo do diálogo Personalizar. Filtros externos são programas separados que podem ser gravados para integração com o Trimble Geomatics Office. Todos arquivos externos escritos para serem usados no Trimble Geomatics Office devem condizer com requerimentos específicos se tiverem que ser adicionados ao sistema. Somente aparecem os filtros instalados para a guia selecionada no diálogo Exportar.

Todo programa de filtro deve ser compilado como um arquivo de Dynamically Linked Library (*.dll), com funções específicas exportadas e deve ser criado como um objeto COM (Módulo do Objeto Componente).

Uma vez que tenha selecionado o arquivo apropriado, o Trimble Geomatics Office registra o objeto COM do filtro no computador e verifica se a interface .dll está conforme os requerimentos do sistema. Se isso não tiver êxito, o sistema relata que não é capaz de registrar o filtro. Se o filtro for instalado com êxito, a descrição curta do filtro é listada no diálogo.

Para maiores informações, consulte Arquivos externos de Importação/Exportação.

Opções

Para o arquivo importado, clique o botão Opções para:

  especificar as unidades de dados exportados.

  especificar as configurações do arquivo exportado.

  mudar o sistema de coordenadas do arquivo de dados que está exportando.

  mudar as opções para a exportação de dados para um dispositivo, 3300/3600/5600 Elta M5, ou 3600/5600 GDM.

Quando um formato de exportação não pode ser configurado, este botão não é disponível.

Para especificar detalhes de configuração sobre o arquivo específico a ser exportado, clique em Opções. Por exemplo, no caso do formato AutoCAD (*.dxf ou *.dwg), pode-se selecionar o formato de dados de Opções de Exportação AutoCAD Export (.dwg, Ascii .dxf, Binary .dxf), o número da versão AutoCAD e referenciar um desenho protótipo.

Sistema de coordenadas para dados de exportação

Para selecionar o sistema de coordenadas do arquivo de dados que deseja exportar, clique Mudar no diálogo Opções. Este botão é disponível se o formato atualmente realçado não possui uma definição de sistema de coordenadas incluído no arquivo. Se você selecionar um sistema de coordenadas diferente daquele que está sendo usado para o projeto, o Trimble Geomatics Office converte as coordenadas dos pontos a serem exportados para o sistema de coordenadas selecionado, grava o arquivo de exportação e armazena pontos no sistema de coordenadas selecionado.

NOTA: Os valores das coordenadas para pontos exibidos no Trimble Geomatics Office podem diferir daqueles gravados no arquivo.

Exportar

Se uma seleção foi feita através das ferramentas de Seleção, pode-se escolher entre exportar os dados selecionados ou todo um banco de dados.

Duas opções são disponíveis:

Seleção	Exporta pontos selecionados
Todo o banco de dados	Exporta todos pontos de um banco de dados
Quando não existir uma seleção, os botões de seleção não são disponíveis e a exportação é aplicada em todo o banco de dados.

Classificar Dados

Pode-se escolher a ordem em que os dados serão exportados:

1.	Marque a caixa de seleção Classificar dados.

2.	Selecione uma ordem de classificação na lista. Escolhe uma das seguintes opções:

Ordem do banco de dados	Elevação
Nome	Qualidade
Hora de início	Tipo de dados
Período de ocupação

NOTA: As mesmas opções de classificação estão disponíveis na janela de Propriedades.

SUGESTÃO: Se você adicionar suas próprias perguntas de classificação, elas serão adicionadas à lista. Para maiores informações, consulte o tópico Perguntas do Banco de Dados – Perspectiva geral.


Formatos de exportação - guia Levantamento

 Perspectiva Geral e Maiores Informações

Use a guia Levantamento do diálogo Exportar para exportar dados de levantamento para um arquivo ou para um dispositivo.

Para acessar esta guia:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

Pode-se mover formatos personalizados para esta guia. Para maiores informações, consulte o  arquivo Asciiexp.dat.

Esta guia contém os seguintes formatos:

Opção	Use esta opção para exportar …
Detalhes da antena para o Survey Controller	novos detalhes da antena para o Trimble Survey Controller. Por exemplo, quando a Trimble põe no mercado uma nova antena, use esta opção de exportação para transferir os detalhes da antena para o Survey Controller da Trimble.
Mapa de fundo para Trimble Survey Controller (*.dxf)	Um arquivo dxf para o Trimble Survey Controller (versão 10 ou mais recente).
Arquivo de coordenadas delimitados por vírgula para o Trimble Survey Controller (*.csv)	Um arquivo csv para o Trimble Survey Controller (versão 10 ou mais recente).
Dicionário de Dados ao Survey Controller (*.ddf)	um arquivo do dicionário de dados (.ddf) para um dispositivo que executa o Trimble Survey Controller. Para fazer isso, requer-se uma configuração de dispositivo Survey Controller. Pode-se criar um arquivo .ddf na utilidade Data Dictionary Editor. Esta utilidade é parte do software GPS Pathfinder da Trimble. NOTA: somente pode-se exportar um arquivo .ddf à versão 7.00 do Trimble Survey Controller.
Grid do Datum para o Survey Controller (*.cdg)	o grid do datum para o Trimble Survey Controller (versão 7.00 ou mais recente). Pode-se reduzir o tamanho do arquivo do grid do datum transferido (sub grid). Versões anteriores do Trimble Survey Controller não suportam grids do datum. Para fazê-lo, requer-se uma configuração do dispositivo Survey Controller. NOTA: Somente pode-se subdividir o grid do datum usado no sistema de coordenadas do projetos atual, mas pode-se exportar qualquer grid de datum combinado.
Arquivo de descrição para o dispositivo TDS (*.txt)	um arquivo de descrição (*.txt) para para um dispositivo que execute o software TDS. Para fazê-lo, deve antes configurar um dispositivo TDS. Pode-se criar um arquivo de descrição manualmente ou exportar um da utilidade Feature Code Editor.
Pontos DTM para arquivo (*.dtx)	um arquivo de Modelo Digital de Terreno (*.dtx) dos pontos selecionados no projeto, compatível com o Trimble Survey Controller.
Pontos DTM para o Survey Controller	um arquivo de Modelo Digital de Terreno (*.dtx) dos pontos selecionados do Trimble Survey Controller para serem exportados diretamente para o Trimble Survey Controller. Para fazê-lo, requer-se uma configuração do dispositivo Survey Controller.
Biblioteca de Característica e atributo para o arquivo SDR33 (*.sdr)	um arquivo SDR33 que contém registros de nota para cada código de característica da biblioteca selecionada. Não pode-se exportar atributos com esta opção.
Biblioteca de Características e Atributos para o Survey Controller (*.fcl)	uma biblioteca de características e atributos para um dispositivo que execute o Trimble Survey Controller. O arquivo pode ou não conter atributos (se atributos devem ser exportados, marque a caixa de seleção). Para fazer isso, requer-se a configuração do dispositivo Survey Controller. Nenhuma outra informação da biblioteca de características e atributos (por exemplo, estilos de ponto) é transferida para o Trimble Survey Controller.
Biblioteca de características e atributos para o dispositivo (*.fcl)	um arquivo de descrição (*.txt) baseado na Biblioteca de Características e Atributos selecionada para um dispositivo que execute o software TDS. Para fazê-lo, deve-se antes configurar um dispositivo TDS. Atributos não são exportados para o software TDS.
Arquivo Geóide para Survey Controller (*.ggf)	um arquivo de grid do geóide para um dispositivo que execute o Trimble Survey Controller (versão 6 ou mais recente). Pode-se selecionar a área na qual se está trabalhando. Isso reduz o tamanho do arquivo de grid do geóide transferido para o Trimble Survey Controller (sub grid).  Para fazer isso, requer-se a configuração do dispositivo Survey Controller. NOTA: Para subdividir o grid, deve-se usar um sistema de coordenadas que tenha um modelo de geóide definido. Somente pode-se subdividir o grid que o arquivo do grid do geóide está usando, mas pode-se exportar qualquer arquivo geóide.
Arquivo geóide para o TDS Survey Pro (CE)	um arquivo Grid do Geóide para um dispositivo que execute o TDS Survey Pro (CE).  Pode-se selecionar a área na qual se trabalha. Isso reduz o tamanho do arquivo do grid do geóide transferido
Arquivo Pcode para 3600/5600 GDM (*pco)	um arquivo pcode para um 3600/5600 GDM.
Arquivos NGS Bluebook	arquivos B, G e SERFIL. O formato NGS Bluebook é primariamente usado para transferir linhas de base GPS ao “US National Geodetic Survey” para inclusão na rede de controle nacional.
Formato Trimble Data Exchange	dados de levantamento do projeto Trimble Geomatics Office. Use este formato para copiar dados de levantamento entre projetos do Trimble Geomatics Office. Este formato também é usado para exportar dados para pacotes de software de ajuste da rede de outras marcas. O formato foi definido pela Trimble e é usado para produzir um arquivo ASCII que contém estações e vetores GPS processados de coordenadas, observações terrestres, observações de laser, nivelamento e informações de azimute. Consulte o vendedor de software de ajuste de rede para ver se ele suporta este formato
Arquivos SDR (*.sdr)	um arquivo .sdr que usa o projeto atual da versão configurada. Clique em Opções para mudar a configuração.
Pontos de controle bidimensionais STAR*NET	pontos de controle do formato bidimensional STAR*NET. Somente pontos do banco de dados que têm uma qualidade de controle Norte/Leste são exportados. A qualidade de Elevação pode ser de qualquer qualidade. Quando se está trabalhando com um pacote de STAR*NET, é melhor combinar os pontos de controle e arquivos de observação num só arquivo, usando um editor de texto apropriado.
Pontos de controle tridimensionais STAR*NET	pontos de controle do formato tridimensional STAR*NET. Somente pontos do banco de dados que têm uma qualidade de controle Norte/Leste e uma qualidade de Elevação são exportados. Quando se está trabalhando com um pacote de STAR*NET, é melhor combinar os pontos de controle e arquivos de observação num só arquivo, usando um editor de texto apropriado.
Observações STAR*NET	todas observações convencionais do banco de dados do projeto do formato de observação STAR*NET. Quando se está trabalhando com um pacote de STAR*NET, é melhor combinar os pontos de controle e arquivos de observação num só arquivo, usando um editor de texto apropriado.
Dispositivo de levantamento	dados diretamente para estação Total suportadas, Coletores de dados, Cartões de dados de levantamento e receptores GPS.
Survey Controller (*.dc)	um arquivo .dc que use o projeto atual na versão configurada. Clique Opções para mudar a configuração.
Arquivos Trimble 3300 / 3600 /5600 Elta M5	um arquivo Trimble 3300 / 3600 /5600 Elta M5
Arquivos Trimble 3600/5600 GDM (*.are)	Arquivo de área Trimble 3600/5600 GDM
Arquivos Trimble Elta GPS Controller M5 (*.dat)	um arquivo de coordenadas Trimble Elta GPS Controller M5
Arquivos TDS Survey Pro (CE) Job (*.job)	um arquivo de trabalho para um dispositivo TDS Survey Pro CE.
Trimble 3600/5600 TDS coordinate files (*.cr5)	um arquivo de coordenadas para um dispositivo Trimble 3600/5600 TDS.
Arquivos do formato Trimble Data Exchange (*.asc)	um arquivo TDEF


Formatos de Exportação CAD / ASCII

 Perspectiva Geral e Maiores Informações

Use a guia CAD/ASCII para exportar dados para uma variedade de formatos ASCII e CAD.

Para acessar a guia Exportar / CAD/ASCII:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia CAD/ASCII.

Pode-se mover formatos personalizados para esta guia. Para maiores informações, consulte o arquivo Asciiexp.dat.

NOTA: Todos formatos de exportação que emitem arquivos ASCII sempre emitem dados numéricos em formato padronizado (sem separadores para milhares nem vírgula decimal). As saídas de valores para um arquivo ASCII estão nas mesmas unidades daquelas que estão sendo usadas atualmente para a visualização do sistema, a não ser que mudem-se as unidades através da lista de dados Unidades para exportar. Para mudar as unidades de visualização do sistema, selecione Arquivo / Propriedades do projeto. Abre-se o diálogo Propriedades do projeto. Selecione a guia Unidades e Formato.

A guia CAD / ASCII possui as seguintes opções:

Opção	Use esta opção para exportar ...
Arquivos AutoCAD (*.dxf, *.dwg)	um intercâmbio de desenho ou arquivo de desenho para AutoCAD. Para configurar o formato de dados, versão e desenho do protótipo, clique Opções.
Formato padrão de C&G	um arquivo do formato padrão ASCII do software C&G.
C&G sem citações	um arquivo do formato padrão ASCII do software C&G sem citações.
Arquivo CMM (*.cor, *.lev)	os arquivos do formato padrão ASCII usados pelo “Bureaux of Land Management”. A opção do arquivo CMM (*.cor, *.lev) é fornecida usando um filtro de exportação externo.
Notas de atributos do arquivo DC (Survey Controller V4)	um arquivo .dc da versão 4 do Trimble Survey Controller que possui atributos com valores separados por dois pontos (:). Atributos coletados usando uma biblioteca de características e atributos não são exportados neste formato.
Formato Pacsoft	um arquivo do formato Pacsoft ASCII.
Formato SDMS	dados no formato do Survey Data Management System do AASHTO.
Coordenadas SDRmap	um arquivo de coordenadas SDRmap.
arquivo fieldbook do Autodesk (*.fbk)	um arquivo no formato ‘fieldbook’ do Autodesk.
Arquivo – TERRAMODEL – P,N,E,Z,20D (*.pts)	um arquivo básico, delimitado por vírgula
TPLAN (LLHE)	um arquivo do formato ASCII do Trimble GPSurvey. As coordenadas de latitude e longtitude do WGS-84 são exportadas com esta opção.
Arquivo de Gráficos TRIMMAP (*.tgf)	um arquivo de gráficos TRIMMAP (ou SDRmap).
Formato WILDsoft	um arquivo do formato ASCII WILDsoft.


Formatos de exportação - guia Personalizar

Para acessar a guia Exportar / Personalizar:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Personalizar.

Pode-se mover formatos personalizados para outras guias. Para maiores informações, consulte arquivo Asciiexp.dat.

Use a guia Personalizar para:

  exportar arquivos de dados num formato personalizado

  adicionar novos formatos de exportação personalizados

  editar formatos de exportação personalizados

  apagar formatos de exportação personalizados.

Os seguintes formatos personalizados são fornecidos:

  Pontos delimitados

  Pontos de largura fixa

  Nome,Leste,Norte,Elevação,Código

  Nome,Latitude,Longtitude,Altura (graus Decimais locais)

  Nome,Latitude,Longtitude,Altura (graus decimais WGS-84)

  Nome,Latitude,Longtitude,Altura,Código (Local)

  Nome,Latitude,Longtitude,Altura,Código (WGS-84)

  Nome,Norte,Leste,Elev,Lat,Long,Altura,Código (Local)

  Nome,Norte,Leste,Elev,Lat,Long,Altura,Código (WGS-84)

  Nome,Norte,Leste,Elevação,Código

  Ponto na estrada

  Pontos – Como piquetados

  Estrada – Ponto de intercessão

  Estrada – Placa histórico

Os formatos definidos pelo usuário aparecem na ordem alfabética.

NOTA: Os valores exportados para um arquivo ASCII sempre são escritos em formulário padronizado. Ou seja, símbolo para o agrupamento de dígitos (separador de milhares) e vírgula para decimais. As opções de Painel de controle / Configurações regionais / Número do Microsoft Windows não são usados.

Todos formatos de exportação personalizados são escritos no arquivo Asciiexp.dat.


Diálogo Opções da biblioteca de características e atributos

Use este diálogo para configurar a versão de do Trimble Survey Controller para a qual está exportando.

Versão

Se você selecionar uma versão anterior à versão 7.00, a caixa de seleção Exportar atributos do diálogo opções de Selecionar biblioteca de características e atributos não é disponível. Isso porque estas versões anteriores não suportam atributos.


Diálogo Opções de exportação AutoCAD

Use este diálogo para configurar a versão AutoCAD para a qual está exportando.

Formato de dados

Selecione o formato de saída de dados dentre as seguintes opções:

  DWG (um arquivo binário de desenho AutoCAD)

  ASCII DXF (um arquivo padrão AutoCAD Data eXchange)

  Binary DXF (um arquivo padrão AutoCAD Data eXchange no formato binário)

NOTA: O formato de dados é determinado pelos seus requerimentos (ou do seu cliente).

Versão

Selecione a versão apropriada de AutoCAD para o arquivo de exportação. Ele é determinado pelo sistema para o qual se está exportando.

Desenho protótipo

Use este campo para referenciar um desenho protótipo AutoCAD do qual deseje herdar definições de blocos para usar em arquivos *.dxf e *.dwg criados pelo sistema.

Na medida que o Trimble Geomatics Office cria um arquivo AutoCAD, ele tenta combinar os nomes dos símbolos usados no projeto com blocos definidos no desenho protótipo especificado. Todos espaços nos nomes de símbolos são combinados com sublinhos sob os nomes de bloco de AutoCAD.

Quando um nome de símbolo condiz com um nome de bloco do desenho de protótipo, o bloco apropriado é inserido no arquivo de exportação com a escala e rotação requeridos. Todos símbolos incapazes de condizer com um bloco do desenho protótipo são inseridos como pontos. Um desenho protótipo fornecido (Symbols.dxf) inclui definições de bloco para todos símbolos padrões fornecidos com o sistema.

NOTA: As definições do bloco do desenho protótipo são interpretadas como sendo 200 unidades por 200 unidades, onde as unidades são as unidades de exibição no momento da exportação. A definição 200 por 200 é para condizer com o grid usado pelo símbolo da utilidade Trimble e Line Type Editor. Se desejar construir o seu desenho protótipo pessoal com definições de bloco, certifique-se de que os blocos estão baseados numa definição de 200 por 200, para obter uma escala correta dos símbolos.

Procurar

Clique Procurar para procurar no seu sistema e encontrar os arquivos AutoCAD requeridos.


Diálogo Definir Formato de Exportação ASCII

Use este diálogo para definir os formatos de exportação ASCII.

Nome

Insira o nome do formato de exportação. Este nome aparece na lista de Tipos da guia Personalizar do diálogo Exportar. Nomes duplicados não são permitidos.

Seqüência nula

Insira a seqüência nula para a definição do formato de exportação. Este campo é opcional. Toda vez que encontra-se um campo do banco de dados que não recebeu um valor, o Trimble Geomatics Office emite a seqüência nula dentro do formato de arquivo.

NOTA: Alguns tipos de arquivo podem requerer uma seqüência especial, tal como “99999,99”, “*****” , ou parecida. Ao especificar a configuração, pode-se pedir ao Trimble Geomatics Office que use a sua preferência.

Descrição

Insira uma descrição ao formato de exortação. A descrição aparece na barra de status. Este campo é opcional.

Extensão padrão

Insira a extensão padrão para o formato de exportação. Por exemplo, .dat ou .fbk. Este campo é opcional e, se omitido, considera-se como sendo “*.txt”.

NOTA: O Trimble Geomatics Office especifica a extensão do campo Salvar como Tipo do diálogo Salvar como. O nome do arquivo para o novo arquivo pode ser inserido no campo Nome do arquivo. Todos arquivos com a extensão apropriada da pasta selecionada são exibidos de modo que podem ser sobrescritos, se necessário. O Trimble Geomatics Office considera automaticamente que há um ponto entre o nome e uma extensão.

Exportar de

Selecione uma das tabelas primárias ou perguntas como fonte para os arquivos selecionados. A fonte padrão são os registros de ponto. Isso lhe permite exportar todos registros da tabela de pontos.

Preencher formato automaticamente

Clique Preencher formato automaticamente para inicializar automaticamente o cabeçalho e corpo. Para maiores informações, consulte Preencher formato automaticamente.

Cabeçalho do formato

Insira o texto, definições de código de campo ou ambas (a partir do menu de atalho) que o Trimble Geomatics Office irá usar para criar qualquer parte fixa do arquivo de exportação. Este campo é opcional.

Para detalhes completos sobre todos códigos de campo disponíveis no sistema, consulte Códigos de campo – Perspectiva geral.

Para adicionar linhas em branco na definição do cabeçalho, pressione Enter.

Corpo do formato

Insira a definição de código de campo apropriada (a partir do menu de atalho) para indicar os dados que o Trimble Geomatics Office deve exportar do banco de dados. Deve-se inserir uma definição de saída neste campo. Se os dados para uma só entidade devem ser exportados para múltiplas linhas, use a definição. Para fazer isso, pressione Inserir para iniciar uma nova linha de definição.

NOTA: Para maiores informações sobre todos os campos disponíveis do sistema, consulte Introdução de códigos de campo.

Formato das notas de rodapé

Insira (a partir do menu de atalho) o texto, definições do código de campo ou ambos que o Trimble Geomatics Office usará para criar qualquer parte fixa final do arquivo de exportação. Este campo é opcional.

Para detalhes completos sobre todos os códigos de campo disponíveis no sistema, consulte Códigos de campo – Perspectiva geral.

Para adicionar linhas em branco na definição das notas de rodapé, pressione Enter.

Para exemplos de exportação de ASCII personalizados, consulte o tópico Definir Formato de Exportação ASCII - Exemplos.


Definir Formato de Exportação ASCII - Exemplos

Ver também

Estes exemplos mostram como criar alguns formatos de exportação de ASCII, considerando que um projeto possui os seguintes pontos nele:

Nome: 1000	Leste: 534247.541	Norte: 263104.807	Elev: 10.118	Código: EST

Nome: 1024	Leste: 534220.249	Norte: 263104.249	Elev: 10.129	Código: MH

Nome: 1025	Leste: 534222.850	Norte: 263100.894	Elev: 10.133	Código: ÁRV

Nome: 1026	Leste: 534222.218	Norte: 263095.934	Elev: 10.136	Código: ÁRV

Nome: 1027	Leste: 534224.816	Norte: 263092.579	Elev: 10.140	Código: POST

Nome: 1028	Leste: 534228.398	Norte: 263089.101	Elev: 10.732	Código: CERC

Nome: 1041	Leste: 534236.948	Norte: 263084.989	Elev: 11.054	Código: CERC

Nome: 1042	Leste: 534237.326	Norte: 263087.964	Elev: 10.982	Código: CERC

Nome: 1087	Leste: 534243.575	Norte: 263099.773	Elev: 10.154	Código: MH

Exemplo 1

O formato de exportação:

Cabeçalho da exportação:

Formato do arquivo Versão 1.50

Data: [$System.Date]

Projeto: [$Projeto.Nome]

Formato do corpo:

[Nome],[Leste:0.3],[Norte:0.3],[Elevação:0.3],[Código da característica]

Formato das notas de rodapé:

[$Sistema.Sobre]

Este formato de corpo produz o seguinte arquivo de exportação (considerando a data apropriada, as configurações do formato da data do Microsoft Windows e nome do projeto):

Versão do formato do arquivo 1.50

Data: 8/11/96

Projeto: Exemplo

1000,534247.541,263104.807,10.118,EST

1024,534220.249,263104.249,10.129,MH

1025,534222.850,263100.894,10.133,ÁRVORE

1026,534222.218,263095.934,10.136,ÁRVORE

1027,534224.816,263092.579,10.140,POSTE

1028,534228.398,263089.101,10.732,CERCA

1041,534236.948,263084.989,11.054,CERCA

1042,534237.326,263087.964,10.982,CERCA

1087,534243.575,263099.773,10.154,MH

Trimble Geomatics Office, Versão 1.50

Exemplo 2

O formato de exportação:

Sem formato de cabeçalho

Formato do corpo:

[Nome:4][Leste:12.3][Norte:12.3][Elevação:12.3] [Código de características]

Este formato de corpo produz o seguinte arquivo de exportação:

1000  534247.541  263104.807      10.118 EST

1024  534220.249  263104.249      10.129 MH

1025  534222.850  263100.894      10.133 ÁRVORE

1026  534222.218  263095.934      10.136 ÁRVORE

1027  534224.816  263092.579      10.140 POSTE

1028  534228.398  263089.101      10.732 CERCA

1041  534236.948  263084.989      11.054 CERCA

1042  534237.326  263087.964      10.982 CERCA

1087  534243.575  263099.773      10.154 MH

NOTA: O Trimble Geomatics Office considera que uma nova linha é inserida no final do cabeçalho e do corpo. Para adicionar novas linhas, pressione Enter. O ponto de inserção move uma linha para baixo, volta para a margem esquerda e cria uma linha em branco para inserir um texto novo.


Opção do formato SDMS

O formato “Survey Data Management System” (SDMS), definido pela “American Association of State Highway and Transportation Officials” (AASHTO), consiste de um formato especial para dados de levantamento. Exportam-se dados do Trimble Geomatics Office neste formato.

Esta opção exporta pontos e suas notas de atributo. Estas notas podem conter extra características de ponto. Estas notas de atributo são inseridas no dispositivo que executa o Trimble Survey Controller durante um levantamento. A funcionalidade da nota especial de atributo do Trimble Survey Controller ajuda nisso. Adicionalmente, todas notas de registro inseridas com um identificador de caractere seguidas por dois pontos (:) ou um espaço terão os detalhes de atributo exportadas para um arquivo SDMS.

Por exemplo, uma nota que contenha I0:informações ou I0 informações será exportada para um arquivo SDMS como I0:informações, onde ‘informações’ é o texto associado ao identificador I0 do SDMS.

Para que notas de atributo sejam associadas aos pontos corretos no arquivo SDMS criado, durante a exportação deve-se escolher o grupo de seleção criada automaticamente quando o arquivo do Trimble Survey Controller *.dc foi importado para o projeto. Este grupo de seleção mantém todos dados (incluindo notas registradas) na ordem do levantamento, como encontrado no arquivo .dc.


Filtros Externos - Perspectiva geral

O Trimble Geomatics Office fornece a opção de adicionar filtros de importação e de exportação. Pode-se escrever estes arquivos independentemente do programa do sistema principal como “Dynamically Linked Libraries” (.dll) de funções específicas exportadas. Os arquivos .dll devem ser criados como módulos de “Object Linking and Embedding” (OLE). Estes módulos também são conhecidos como objetos de “Component Object Module” (COM).

As seguintes funções exportadas devem ser fornecidas num filtro externo:

Função GetGUID

Declaração da função Pascal:	função GetGUID: TGUID; stdcall; exportar;

C/C++ declaração da função:	GUID __stdcall __exportar GetGUID()

Esta função deve retornar o identificador único OLE da classe componente (GUID = Globally Unique IDentifier) que foi designado ao programa. Este identificador único é obtido através do uso de um programa apropriado que gera um identificador único, geralmente baseado em informações tais como horário e data do computador e qualquer identidade de cartão de rede ou informações parecidas. A idéia e que a ID deve ser única no mundo e espera-se que isso possa ser obtido usando um número grande o suficiente (eles consistem de 32 dígitos), de modo que seja estatisticamente impossível que dois números aleatórios possuam o mesmo valor. Um exemplo de GUID é 07F750A3-594B-11D1-8E4C-0000C04FCAF9.

Função de conversão

Declaração da função Pascal:	função Convesão(const FileName: WideString): WordBool;

C/C++ declaração da função:	BOOL __stdcall __exportar Convert(BSTR FileName)

Esta é a função que exporta o trabalho atual para o filtro. O programa de filtro deve ser projetado para converter dados de um arquivo de fonte para os dados de formato apropriado armazenados num arquivo de destino. Esta função permite que o Trimble Geomatics Office especifique o nome do arquivo de destino do arquivo a ser criado pelo filtro. No caso de um filtro de importação, o Trimble Geomatics Office espera que o filtro apresente um diálogo Arquivo / Abrir padrão, permitindo a seleção do arquivo fonte. O nome do arquivo de destino, definido pelo sistema para o programa do filtro criar, passa para o filtro na função de Conversão. O arquivo criado pelo programa do filtro de importação deve estar num formato  válido de arquivo .dc (formato de arquivo Survey Controller ou SDR).

Com um filtro de exportação, o Trimble Geomatics Office espera que o filtro apresente um diálogo padrão Arquivo / Salvar, permitindo a seleção do arquivo de destino. O Trimble Geomatics Office cria o arquivo de fonte para o filtro de acordo com o formato de arquivo definido na função do Formato discutida abaixo. O nome do arquivo do arquivo fonte passa para a função de Conversão de modo que o filtro saiba qual o arquivo com que deve trabalhar. O Trimble Geomatics Office extrai os dados do banco de dados, de acordo com os critérios do grupo de seleção definidos para a operação da exportação. A definição do código do campo, como definida na função do Formato, controla o formato dos dados escritos para o arquivo da fonte pelo Trimble Geomatics Office. O programa de filtro de exportação deve ler o arquivo da fonte, converter os dados no formato apropriado de exportação e escrevê-los no arquivo de destino especificado.

Função GetLongDesc

Declaração da função Pascal:	função GetLongDesc: WideString; safecall;

C/C++ declaração da função:	BSTR __stdcall __exportar GetLongDesc()

Esta função é usada para fornecer o texto que é exibido na barra de status do Trimble Geomatics Office quando a opção do filtro de importação e exportação é realçada no diálogo de Importação ou Exportação. A definição desta função é opcional e, se não for definida, nada é exibido na barra de status quando a opção do filtro está realçada.

Função GetShortDesc

Declaração da função Pascal:	função GetShortDesc: WideString; safecall;

C/C++ declaração da função:	BSTR __stdcall __export GetShortDesc()

Esta função é usada para fornecer o texto para o nome do filtro de importação ou exportação exibido no diálogo Importar ou Exportar do Trimble Geomatics Office, permitindo a seleção do filtro.

Função do formato

Declaração da função Pascal:	função Formato: WideString; safecall;

C/C++ declaração da função:	BSTR __stdcall __export Format()

Esta função somente é requerida em programas de filtro de exportação e permite ao programa especificar o formato do arquivo da fonte que deve ser criado pelo Trimble Geomatics Office. A seqüência de texto devolvida por esta função deve consistir de códigos de campo válidos do Trimble Geomatics Office. Se não houver um função de Formato definida num programa de filtro de exportação, o Trimble Geomatics Office assume o formato de ‘[Nome],[Norte],[Leste],[Elevação],[Código de característica]’, criando um arquivo de valores de código Nome, Norte, Leste, Elevação e Código de característica, separados por vírgula, a serem lidos pelo filtro de exportação.


Opção Arquivos de dados GPS (*.dat)

Um arquivo .dat contém dados GPS não processados de um receptor GPS. Estes arquivos podem incluir dados cinemáticos pós-processados e dados estáticos. Arquivos .dat GPS não contêm nenhuma informação do sistema de coordenadas.

Pode-se transferir um arquivo .dat para um projeto do Trimble Geomatics Office de:

  um Trimble Survey Controller (com arquivo .dc)

  um receptor Trimble Survey GPS

  um computador

NOTA: Se um arquivo .dat for importado mais de uma vez para o mesmo projeto, ocupações existentes no banco de dados do projeto não são selecionadas por padrão no diálogo DAT Checkin.


Opção Arquivos RINEX

O formato “Receiver INdependent Exchange” (RINEX) é um formato de arquivo de dados GPS não processados usado para intercambiar arquivos de vários fabricantes de receptores.

Para usar este formato, os seguintes arquivos devem estar presentes no computador:

Arquivo RINEX	Extensão de Arquivo	Opcional
Arquivo de dados de observação	*.obs, *.XXo	−
Arquivo de mensagem de navegação	*.nav, *.XXn	−
Arquivo meteorológico	arquivo *.met ou *.XXm	Estes arquivos são opcionais.
Para importar arquivos RINEX no seu computador para o Trimble Geomatics Office, escolha uma das seguintes opções:

  Use o diálogo Importar e selecione os arquivos RINEX (*.obs, *.??o).

  Use a funcionalidade arrastar e soltar.

Selecione os arquivos de dados de observação. Se os arquivos de observação e navegação não possuírem o mesmo nome, pode-se combinar os arquivos de observação e de navegação  no diálogo Correspondendo Arquivo de Navegação. Navegue para o arquivo selecionado .nav ou selecionar na lista do arquivo de navegação.

Aparece o diálogo DAT Checkin, onde pode-se verificar os valores nos arquivos antes que as observações GPS sejam importadas. Certifique-se de que o tipo de antena e tipo de receptor não sejam desconhecidos.

Quando os arquivos RINEX forem transferidos e todas observações importadas para o banco de dados do projeto, um grupo de seleção é criado com o mesmo nome que o arquivo RINEX.

Quando os arquivos RINEX são importados para o projeto Trimble Geomatics Office, pode-se usar o Trimble Geomatics Office para processar linhas de base GPS (se possuir instalado o módulo de Processamento da Linha de base) e usar o módulo da Linha do tempo para visualizar as observações GPS não processadas (se tiver instalado o módulo de Processamento da Linha de base).


Classes do Survey Controller e como elas são manipuladas no software Trimble Geomatics Office

Quando pontos são criados no Trimble Survey Controller, eles são recebem uma classe de pontos. Quando pontos são importados para um projeto, o Trimble Geomatics Office usa esta classe e o método usado para determinar a posição do ponto para designar uma qualidade ao ponto. Uma recomputação usa a qualidade para determinar a posição calculada para o ponto.

A tabela seguinte mostra as classes fornecidas aos pontos pelo Trimble Survey Controller e como elas são manipuladas pelo Trimble Geomatics Office na importação.

Classe	Descrição	O que acontece na importação
Controle	Uma classe de controle é a mais alta qualidade que pode ser designada a um ponto no Trimble Survey Controller.	Importa como coordenadas de controle para o ponto.
Normal	Uma classe normal é dada a todos pontos medidos, à parte dos pontos piquetados. Pontos digitados também podem receber esta classe.	Importa as observações e coordenadas para o ponto. Às coordenadas dá-se uma qualidade de levantamento.
Piquetar	Uma classe é dada a pontos medidos durante a piquetagem.	Observações de importação de detalhes de piquetagem para um ponto. Pode-se ver os detalhes Como piquetado na guia de piquetagem da janela de Propriedades.
Visada atrás	Uma classe de visada atrás é dada a pontos definidos como um ponto de visada atrás no campo.	Uma classe de visada atrás é tratada do mesmo modo que uma classe normal no Trimble Geomatics Office.
Verificar	Uma classe de verificação é dada a uma observação de verificação ou uma posição digitada como um ponto duplicado e armazenado com ponto de verificação.	Observação de importação com classe “habilitado como verificação”.
Apagado	Uma classe apagada é dada a um ponto sobrescrito ou apagado no Survey Controller.	Pontos com classe apagada não são importados para o projeto do Trimble Geomatics Office. Uma lista de pontos apagados no arquivo .dc é encontrada no relatório criado na importação do arquivo.


Qualidades designadas à Coordenadas e Observações a partir de um arquivo .dc, usando Classes do Survey Controller

Quando as posições GPS são armazenadas no Trimble Survey Controller, elas podem ser derivadas de diferentes técnicas de medições ou de coordenadas digitadas. A qualidade dada ao ponto depende do método de observação ou da qualidade dada ao ponto quando este é digitado.

A seguinte tabela ilustra as qualidades designadas à coordenadas que usam classes do Trimble Survey Controller.

Método de Coordenadas	Qualidade designada
Digitado em controle	Controle
Digitado em normal	Levantamento
Fixo RTK	Levantamento
RTK flutuante	Mapeando
L1 código	Mapeando
Autônomo	Desconhecido
WAAS	Mapeando
Área larga fixa	Levantamento
Área larga flutuante	Mapeando
Código RTCM	Mapeando
Copiado	Qualidade do ponto copiado
NOTA: Para os arquivo .dc do Trimble Survey Controller da versão 7.5 ou mais recente, se usou a tecla Aqui para determinar a posição da base, um método Autônomo é escrito e a posição é importada com uma qualidade de desconhecido. Isso significa que todos pontos medidos na base terão uma qualidade desconhecida.

Se uma calibração do local GPS foi efetuada e se os resultados são confidentes, pode-se aumentar a qualidade da base para levantamento e todos os pontos medidos da base receberão esta qualidade.

Para versões do arquivo .dc do Trimble Survey Controller anteriores à versão 7.5, se usar a tecla Aqui para determinar a posição da base, a posição da base receberá uma qualidade de levantamento.

A seguinte tabela exibe as qualidades dadas a observações, usando classes do Trimble Survey Controller.

Método de observações	Qualidade designada
Convencional	Levantamento
Telêmetro a laser	Mapeando
L1 Fixo	Levantamento
L1 Flutuante	Mapeando
L1 Código	Mapeando


Importando arquivos Leica GSI-16

Quando estiver importando arquivos do formato Leica GSI-16, o Trimble Geomatics Office somente lê Blocos de Medições e palavras Rem associadas com a estes blocos. A operação de importação usa as palavras específicas (gravações) disponíveis para informações da estação. Os seguintes Índices de Palavras são lidos e interpretados durante a operação de importação:

Índice	Significando	Índice	Significando
11	Id do ponto (Identificador do bloco identificador)	82	Ponto norte
21	Ângulo horizontal	83	Elevação do ponto
22	Ângulo vertical	84	Leste da estação
31	Distância do declive	85	Norte da estação
32	Distância horizontal	86	Elevação da estação
33	Distância vertical	87	Altura do refletor
71…79	Palavras comentários (used for codes and notes)	88	Altura do instrumento
81	Leste do ponto
Com base nestes Índices de Palavras, a Trimble recomenda que se especifique os seguintes dados de estação e dados de medição, registrando máscaras no instrumento Leica:

Máscara de dados da estação	Máscara de dados de medição
Id do Ponto (11)	Id do Ponto (11)
Leste da estação (84)	Ângulo horizontal (21)
Norte da estação (85)	Ângulo vertical (22)
Elevação da estação (86)	Distância do declive (31)
Altura do instrumento (88)	ppm e constante do prisma (51)
Código (71)	Altura do refletor (87)
Nota (72)	Código (71)
	Nota (72)
NOTA: Durante a importação, o software deduz que a primeira observação registrada depois que um registro de estação é uma observação ao ponto de visada atrás. A primeira palavra de comentário (71) é interpretada como o código do ponto e todas outras palavras de comentário (72…79) são interpretadas como registros de Nota.


Opção Arquivos de nível digital (*.dat, *.raw)

Arquivos de nível digital contém dados armazenados num nível digital.

Arquivos de dados dos seguintes níveis digitais são suportados:

  Leica NA 2002/3003

  Zeiss DiNi 11/11T/21

  Nível Trimble DiNi Digital Level

Quando um arquivo de nível Digital é importado, aparece o diálogo Importação do nível digital.

NOTA: Deve-se transferir arquivos de dados de um nível digital Zeiss DiNi no formato M5.


NGS Bluebook Export

O NGS Bluebook Export lhe permite gerar arquivos Bluebook padrões do National Geodetic Survey (NGS), a partir do Trimble Geomatics Office.

Arquivos Bluebook são definidos pelo Governo americano e são requeridos para levantamentos submetidos ao Sistema de Referência Espacial Nacional. As normas para estes levantamentos estão contidas num livro azul e a submissão destes levantamentos são conhecidas como “bluebooking”.

A utilidade NGS Bluebook cria os seguintes arquivos do livro azul para linhas de base GPS:

  NGS

  B – informações do projeto

  G – informações da linha de base

  SERFIL – um arquivo ASCII que contém a estação SSN, ID e nomes de estações de um projeto existente

O diálogo Arquivos NGS Bluebook usa dados associados ao grupo selecionado de linhas de base processadas independentemente no seu projeto. Antes de exportar os arquivos NGS, deve-se preencher todos trabalhos de campo, processamento e garantia de qualidade. Uma vez que linhas de base são selecionadas e a exportação é iniciada, não pode-se adicionar nenhuma linha de base ao diálogo Bluebooking, a não ser que o processo de exportação seja iniciado novamente.

NOTA: Para uma descrição dos dados requeridos para cada campo do diálogo de exportação de NGS Bluebook, consulte o documento “Input Formats and Specifications of the National Geodetic Survey (NGS) Data Base”. A referência ao NGS encontra-se no: http://www.ngs.noaa.gov/FGCS/BlueBook/


Diálogo Arquivos NGS Bluebook

O arquivo de exportação NGS Bluebook lhe permite gerar arquivos padrões do National Geodetic Survey (NGS) Bluebook do Trimble Geomatics Office.

O diálogo Arquivos NGS Bluebook usa dados associados ao grupo selecionado de linhas de base processadas independentemente no seu projeto. Antes de exportar os arquivos NGS, deve-se preencher todos trabalhos de campo, processamentos e segurança de qualidade. Uma vez que as linhas de base são selecionadas e a exportação é iniciada, não pode-se adicionar nenhuma linha de base ao diálogo Bluebooking, a não ser que o processo de exportação seja iniciado novamente .

Para acessar o diálogo Arquivos NGS Bluebook:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Na guia Levantamento, selecione arquivos NGS Bluebook.

NOTA: Se uma sessão de bluebooking foi salvada antes, lhe será perguntado se deseja carregar as informações salvadas.

Use as guias do diálogo Exportar NGS Bluebook para inserir informações sobre o projeto.

Guia Projeto

Esta guia contém informações gerais sobre o projeto.

Guia Estação

Esta guia contém uma lista de todas estações associadas às linhas de base selecioandas:

  Preencha a ID de 4 Caracteres e Estação SN, usando botões de Auto-Gerar. A ID é gerada usando os primeiros quatro caracteres do nome da estação. As SNs são geradas numa seqüência, iniciando em 0001, ou com o primeiro número disponível.

  A coluna Código Estado/País é preenchida automaticamente com base nas informações da guia do Projeto.

  Selecione a ordem da lista.

  A coluna Tipo tem como padrão automático “A-Interferometric Satellite Relative Positioning Main Scheme” desde que os dados de bluebooking são de métodos de coleta de GPS.

  Use o botão SERFIL para importar Ids e SNs existentes de 4 Caracteres, usando um SERFIL de um projeto anterior. O SERFIL deve conter o nome da estação para cada estação. Este formato é ligeiramente diferente do formato NGS SERFIL, mas o NGS ainda pode usar o arquivo. O formato que deve ser usado é o seguinte:

ID de 4 caractere   Estação SN    Nome Estação

COWB   0004   COWBOY

Guia Informações da Sessão

Esta guia contém informações sobre cada sessão do campo das linhas de base selecionadas. As cores que se alternam representam cada sessão individual da linha de base.

  O tempo de início representa o último tempo de início de todos receptores da sessão e pode não representar o tempo de início de cada linha de base individual. O tempo deve ser usado somente como uma referência quando se combinam as sessões às folhas das sessões.

  A coluna do receptor é preenchida automaticamente com o tipo do receptor  e número serial.

  A coluna da antena é preenchida automaticamente com o tipo da antena. No entanto, deve-se inserir o número serial. Uma vez que cada antena SN é inserida, ela pode ser selecionada de uma lista de caída.

  A coluna Altura da Antena (Metros/APC L1) é automaticamente preenchida com a medição vertical verdadeira ao centro de fase L1, que é computado da altura da antena inserida no campo ou durante a verificação.

Guia do Tempo pré Sessão e Tempo pós Sessão

As guias Tempo pré e pós sessão contém informações sobre o tempo para cada ocupação associada às linhas de base selecionadas. Os campos são requeridos quando se efetua uma ordem B ou levantamento acima. O asterisco é removido automaticamente do cabeçalho da guia quando o levantamento da primeira ordem é selecionado na guia Projeto.

Este campo	Tem como padrão
Bulbo seco	Celsius
Bulbo úmido	Celsius
Umidade	Porcentagem
Pressão	Unidades de milibar
  O campo de Código do tempo é preenchido inserindo o código diretamente ou usando o botão Editar campo atual.

  O botão Editar campo atual lhe permite visualizar e selecionar os códigos da descrição de cada variável.

  O campo Copiar Tempo de pré (pós) sessão é usado para copiar os mesmos dados da guia de Tempo pré (pós) sessão e vice-versa.

Guia Vários

A guia Vários contém informações gerais sobre o processamento.

Equipamento

O botão Equipamento lhe permite visualizar, adicionar e editar informações sobre cada receptor e antena. Somente o equipamento associado ao projeto é listado.

OK

O botão OK fecha o diálogo Arquivos NGS Bluebook e salva as informações em cada guia. Quando se insere uma grande quantidade de dados, pode-se salvar o trabalho e voltar a ele novamente.

Exportar

O botão Exportar é disponível depois que todos campos requeridos são preenchidos. O botão Exportar lhe permite inserir um nome e selecionar um local para cada arquivo. O local padrão é Trimble Geomatics Office\Projetos\<Nome do Projeto>\Exportar.

NOTA: Na medida que cada campo requerido da guia é preenchido, o * ao lado do nome é removido. Quando não houver mais campos para preencher no diálogo, o botão Exportar fica disponível.

NOTA: Para uma descrição dos dados requeridos para cada campo do diálogo Exportar NGS Bluebook, consulte o documento “Input Formats and Specifications of the National Geodetic Survey (NGS) Data Base”. A referência ao NGS pode ser encontrada no: http://www.ngs.noaa.gov/FGCS/BlueBook/


Formato de Intercâmbio de Dados da Trimble

Como

O Formato de Intercâmbio de dados de Trimble foi projetado pela Trimble Navigation Limited para fazer o seguinte:

  transferir dados de levantamento entre os projetos do Trimble Geomatics Office

  exportar dados de levantamento para outras aplicações para ajustes de rede ou outras operações geodésicas

NOTA: Verifique se o vendedor de software de ajuste da rede suporta este formato.

Para importar ou exportar dados usando este formato, selecione a opção Intercâmbio de dados da Trimble dos diálogos Importar ou Exportar.

As informações seguintes são armazenadas num arquivo ASCII:

Estações e coordenads	Vetores GPS
Observações terrestres	Observações laser
Informações de nivelamento	Informações de azimute
O arquivo está organizado nas seguintes seções:

[Geral]

Esta seção fornece informações gerais sobre o conteúdo do arquivo, o projeto de onde veio e as unidades usadas por vários campos.

[Estações]

Esta seção inclui o nome e coordenadas de todos pontos selecionados para transferência. Coordenadas nesta seção sempre estão no datum local. Observações individuais estão em registros de estação, que incluem latitude, longitude, norte, leste. Elipsóide e altura ortométrica também podem aparecer em cada registro.

O registro da estação também contém informações sobre os componentes de coordenadas identificados como controle, e o código de característica designado para a estação.

[GPS]

Esta seção inclui as linhas de base do vetor GPS selecionadas para transferência. Observações individuais estão nos registros do vetor, que incluem:

Nomes Da e Para estação	Componentes do vetor
Informações sobre a covariância	Alturas de antena
Tipo de processamento	Índice
RMS	Variância de referência
Hora e data das observações
[Terrestre]

Esta seção inclui as observações terrestres selecionadas para transferência. Observações individuais estão nos registros TerrObs, que incluem:

Ponto de instrumento	Ponto de visada atrás
Ponto de visada a frente	Ângulo horizontal e erro
Ângulo vertical e erro	Distância de declive e erro
Constante do prisma	Altura do instrumento
Data e hora da observação (se disponível)	Altura do destino
[Laser]

Esta seção inclui as observações de laser selecionadas para a transferência. Observações individuais estão nos registros LaserObs, que incluem:

Ponto do instrumento	Declinação magnética
Azimute magnético	Distância do declive
Ângulo vertical	Altura do alvo
Altura do instrumento	Ponto do alvo
Data e hora da observação (se disponível)
[Nível]

Esta seção inclui observações de nível selecionadas para transferência. Observações individuais estão nos registros de LevelObs, que incluem:

Pontos no início e no fim do nível	Elevação do delta e erro
Distância (se disponível)	Número de vezes (se disponível)
Data e hora da observação (se disponível)

[Azimute]

Esta seção inclui os registros de azimute, que contém observações individuais.


Arquivos do Projeto Terramodel (*.pro)

O Trimble Geomatics Office suporta o formato de arquivo Projeto Terramodel (*.pro).

Use o Trimble Geomatics Office para importar um arquivo do Projeto Terramodel (*.pro) para um projeto do Trimble Geomatics Office:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia CAD / ASCII.

3.	Selecione a opção arquivos do Projeto Terramodel (*.pro).

Aparece o diálogo Abrir.

4.	Selecione o arquivo para importar e clique Abrir.

NOTA: Somente pontos, trabalho de linha e camadas são importadas dos arquivos do Projeto Terramodel (*.pro).


Software TDS - Perspectiva Geral

Ver também

Arquivos de suporte do Trimble Geomatics Office do seguinte software TDS:

  TDS Survey Pro CE

  TDS 3600 embutido

  TDS 5600 embutido

Pode-se importar e exportar arquivos TDS do seu PC ou transferi-los diretamente para e de o software TDS, usando as opções de importação e exportação dos Dispositivos de Levantamento.

NOTA: O Trimble Geomatics Office não suporta os arquivos de controle do TDS. Deve-se importar os pontos de quaisquer arquivos de controle usados no trabalho principal antes da transferência dos arquivos. Para maiores informações, consulte a documentação do TDS.

NOTA: O Trimble Geomatics Office não suporta as características e atributos TDS.

TDS Survey Pro CE

O Trimble Geomatics Office suporta os seguintes arquivos do TDS Survey Pro CE:

Nome	Extensão	Importa	Exporta	Descrição
Job	*.job			Contém informações de pontos e coordenadas. Importa um arquivo de trabalho (*.job) quando você somente quer importar pontos de um projeto TDS Survey Pro CE.
Raw	*.raw		X	Contém informações de observação. Importa um arquivo Raw (*.raw) quando você quer importar ambos pontos e observações de um projeto TDS Survey Pro CE.
Descrição	*.txt	X		Arquivo simples de texto de códigos de característica para ajudá-lo inserir descrições de ponto no TDS Survey Pro CE.
Grid do Geóide	*.ggf	X		Separações do elipsóide de referência WGS84 (TDS Survey Pro CE versão 3.5 ou mais recente)

Para exportar:

  uma definição de estrada (*.job, *.rd5, *.tp5) do RoadLink, consulte a Ajuda do RoadLink.

  um DTM (*.dtm) do DTMLink, consulte a ajuda do DTMLink.

Para maiores informações sobre quaisquer destes arquivos, consulte a documentação TDS.

O Trimble Geomatics Office também fornece suporte de sistema de coordenadas para todas as versões do software TDS Survey Pro CE. Isso inclui suporte para a funcionalidade geodésica melhorada que está disponível no TDS Survey Pro CE 3.5 ou mais recente, quando usado com um receptor Trimble GPS. Qualquer arquivo importado do TDS Survey Pro CE contém uma definição completa do sistema de coordenadas, idêntico àquele do arquivo Survey Controller (*.dc).

NOTA: Observações GPS somente são importadas do TDS Survey Pro CE 3.5 ou mais recente quando usadas com um receptor Trimble GPS. Observações terrestres de qualquer marca de estação total são suportadas a partir de todas suas versões.

Trimble 3600/5600 TDS

O Trimble Geomatics Office suporta os seguintes arquivos do software Trimble 3600/5600 TDS:

Nome	Extensão	Importa	Exporta	Descrição
Coordenada	*.cr5			Contém pontos e informações de coordenadas. Importe um arquivo de coordenadas (*.cr5) quando somente quiser importar pontos de um projeto Trimble 3600/5600 TDS.
Raw	*.rw5		X	Contém informações de observação. Importa um arquivo Raw (*.raw) quando você quer importar ambos pontos e observações de um projeto Trimble 3600/5600 TDS.
Descrição	*.txt	X		Arquivo simples de texto de códigos de característica para ajudá-lo inserir descrições de ponto no TDS Survey Pro CE.
Para exportar:

  uma definição de estrada (*.cr5, *.rd5, *.tp5) do RoadLink, consulte a ajuda RoadLink.

  um Digital Terrain Model (*.dtm) do DTMLink, consulte a ajuda DTMLink.

  Consulte a documentação para maiores informações sobre quaisquer desses arquivos.

Arquivos importados do software Trimble 3600/5600 TDS não contêm definições completas do sistema de coordenadas. Os arquivos são importados usando sistemas de coordenadas somente de escala, o mesmo que arquivos Survey Controller (*.dc).

Quando estiver importando arquivos, o Trimble Geomatics Office define o sistema de coordenadas usando o fator escala usado pela última vez no trabalho TDS Survey Pro CE.

NOTA: Quando estiver importando arquivos de coordenadas Trimble 3600/5600 TDS, o Trimble Geomatics Office importa o arquivo Coordenadas (*.cr5), e depois importa dados do arquivo Raw associado (*.rw5) se ele estiver na mesma pasta do seu computador. Se você somente quiser importar coordenadas, certifique-se de que um arquivo Raw com o mesmo nome do arquivo de coordenadas importado não exista na mesma pasta do seu computador. Arquivos raw também podem ser importados individualmente.


Arquivos TDS Survey Pro CE Job (*.job)

O Trimble Geomatics Office suporta dados no formato de arquivo TDS Survey Pro CE Job (*.job).

Use o Trimble Geomatics Office:

 Importar  um arquivo TDS Survey Pro CE Job  para um projeto Trimble Geomatics Office.

 Exportar um projeto do Trimble Geomatics Office para um arquivo TDS Survey Pro CE Job.

Também pode-se transferir arquivos diretamente para e de o software TDS Survey Pro CE, usando as opções de exportar e impotar dos Dispositivos de Levantamento.

Para importar um arquivo TDS Survey Pro CE Job:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção do arquivo Survey Pro CE Job (*.job) e clique OK.

Aparece o diálogo Abrir.

4.	Selecione o arquivo para importar e clique Abrir.

NOTA: O formato de arquivo TDS Survey Pro CE Job contém pontos e coordenadas associadas. Use esta opção quando somente quiser importar pontos de um projeto TDS Survey Pro CE.

Para exportar o projeto atual do Trimble Geomatics Office para um arquivo TDS Survey Pro CE Job:

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção arquivo TDS Survey Pro CE Job (*.job) e clique OK.

Aparece o diálogo Salvar como.

4.	Selecione uma pasta na qual salvar o arquivo.

5.	Insira um nome no campo nome do arquivo e clique Salvar.

NOTA: Se existirem pontos duplicados na seleção que estão sendo exportadas, o arquivo TDS Survey Pro CE Job não será criado. Certifique-se de o arquivo não será criado. Certifique-se se ele realmente não será criado. Certifique-se de que todos os pontos exportados tenham nomes únicos.


Arquivos TDS Survey Pro CE Ras (*.raw)

Use Trimble Geomatics Office para importar um arquivo TDS Survey Pro CE Raw para um projeto Trimble Geomatics Office. Também pode-se transferir arquivos diretamente do software TDS Survey Pro CE usando a opção de importação de dispositivos de levantamento. O formato de arquivo TDS Survey Pro CE Raw contém todas as informações num projeto Survey Pro CE. Use esta opção quando quiser importar tanto pontos como informações de um projeto TDS Survey Pro CE.

Para importar um arquivo TDS Survey Pro CE Raw:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção arquivo TDS Survey Pro CE Raw (*.raw) e clique OK.

Aparece o diálogo Abrir.

4.	Selecione o arquivo de uma pasta que deseja importar e clique Abrir.


Arquivos de Coord. Trimble 3600/5600 TDS (*.cr5)

Use o Trimble Geomatics Office para:

 Importar um arquivo de Coordenadas Trimble 3600/5600 TDS para um projeto Trimble Geomatics Office.

 Exportar um projeto Trimble Geomatics Office para um arquivo de coordenadas Trimble 3600/5600 TDS.

Também pode-se transferir arquivos diretamente para e de o software Trimble 3600/5600 TDS usando as opções de exportação e importação dos dispositivos de levantamento.

Para importar um arquivo de coordenadas do Trimble 3600/5600 TDS:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção do arquivo Trimble 3600/5600 TDS (*.cr5).

Aparece o diálogo Abrir.

4.	Selecione o arquivo para importar e clique Abrir.

NOTA: Quando estiver importando arquivos de coordenadas Trimble 3600/5600 TDS, o Trimble Geomatics Office importa o arquivo Coordenada e importa então o arquivo associado Dados não processados (*.rw5) se estiver na mesma pasta do seu computador. Se o arquivo de Dados não processados não estiver na mesma pasta do arquivo de coordenadas escolhido para a importação, somente pontos são importados.

Para exportar o projeto atual de Trimble Geomatics Office para um arquivo de coordenadas Trimble 3600/5600 TDS:

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivo Coord. Trimble 3600/5600 TDS (*.cr5).

4.	Clique OK.

Aparece o diálogo Salvar como.

5.	Selecione uma pasta na qual salvará o arquivo.

6.	Insira um nome no campo nome do arquivo e clique Salvar.

NOTA: Se existirem pontos duplicados na seleção que está sendo exportadas ou um ponto possui um nome alfanumérico, o arquivo de coordenadas Trimble 3600/5600 TDS Coordinate não será criado. Certifique-se de que todos os pontos que estão sendo exportados têm nomes numéricos únicos.


Arquivo Trimble 3600/5600 TDS Raw (*.rw5)

Use o Trimble Geomatics Office para Importar um arquivo Trimble 3600/5600 TDS Raw para um projeto do Trimble Geomatics Office. Também pode-se transferir arquivos diretamente para e do software Trimble 3600/5600 TDS usando as opções de exportação e exportação dos dispositivos de levantamento. O formato de arquivo Trimble 3600/5600 TDS Raw contém praticamente todas as informações num projeto do Survey Pro CE. Use esta opção quando quiser importar tanto pontos como observações de um projeto Trimble 3600/5600 TDS.

Para importar um arquivo Trimble 3600/5600 TDS Raw:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção de arquivo Trimble 3600/5600 TDS Raw (*.cr5).

Aparece o diálogo Abrir.

4.	Selecione o arquivo ara importar e clique Abrir.


Arquivos de Descrição TDS (*.txt)

O software TDS Survey Pro CE e Trimble 3600/5600 TDS usa arquivos de descrição para inserir automaticamente descrições para pontos que estão armazenados num trabalho. Para maiores informações, consulte a documentação TDS.

Use o Trimble Geomatics Office para:

 Exportar um arquivo de descrição (*.txt) from Feature Code Editor.

 Exportar um arquivo de descrição existente (*.txt) seja para o software TDS Survey Pro CE ou Trimble 3600/5600 TDS.

 Exportar um arquivo de descrição (*.txt) de uma Biblioteca de Códigos de Características seja para o software TDS Survey Pro CE ou Trimble 3600/5600 TDS.

Para exportar um arquivo de descrição de um Editor de Código de Caracterísitcas, consulte a Ajuda do Editor de Códigos.

Para exportar um arquivos de descrição existente seja para o software TDS Survey Pro CE ou Trimble 3600/5600 TDS:

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivo de Descrição para o Dispositivo TDS (*.txt) e clique OK.

Aparece o diálogo Selecionar.

4.	Selecione o arquivo que deseja exportar e clique Abrir.

Aparece o diálogo Salvar.

5.	Selecione um dispositivo TDS e clique Abrir.

O arquivo é exportado.

Para exportar um novo arquivo de descrição de uma Biblioteca de Código de Característica seja para o software TDS Survey Pro CE ou Trimble 3600/5600 TDS:

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Biblioteca de Característica e Atributos para Dispositivo TDS (*.txt) e clique OK.

Aparece o diálogo Selecionar Biblioteca de Características e Atributos.

4.	Selecione a biblioteca para exportar e clique OK.

Aparece o diálogo Salvar.

5.	Selecione um dispositivo TDS e clique Abrir.

O arquivo é exportado.


Zeiss - Perspectiva Geral

O Trimble Geomatics Office suporta arquivos M5 dos seguintes instrumentos Zeiss:

  Trimble 3300

  Trimble 3600 Elta

  Trimble 5600 Elta

  Trimble Elta GPS Controller

  Trimble DiNi Digital Level

Pode-se importar ou exportar arquivos M5 do seu PC ou transferir arquivos diretamente para e de o instrumento, usando as opções de importação e exportação dos dispositivos de levantamento.

Arquivos Zeiss são suportados pelo Trimble Geomatics Office da seguinte maneira:

Formato de arquivo	Suportado
Elta M5  (inglês e alemão somente)	Sim
Rec 500, R4 e R5	Não.  O CD do Trimble Geomatics Office inclui um programa para converter entre os formatos de arquivo M5 e Rec 500, se necessário.
Elta Codelist	Não

Exportar

O Trimble Geomatics Office exporta nomes de ponto do grid, códigos, descrições e coordenadas para arquivos M5. Outros dados, tais como de observação, não são exportados.

NOTA: Coordinadas do arquivo exportado são gravadas com o mesmo número de casas decimais usados pelo projeto do Trimble Geomatics Office, mas com um máximo de três pontos decimais para o instrumento Trimble 3300 e quatro pontos decimais para os instrumentos Trimble 3600/5600 Elta e Trimble Elta GPS Controller.

Importar

NOTA: O formato de arquivo M5 não suporta definições completas do sistema de coordenada. Arquivos são importados com o uso de sistemas de coordenadas somente escala, que é o mesmo que importar um sistema de coordenadas somente escala num arquivo Survey Controller (*.dc). Pode-se digitar um fator escala ao definir o sistema de coordenadas de importação no Trimble Geomatics Office.

Unidades

O formato M5 possui unidades de "m" (tanto para metros como metros namibianos) ou "ft" (tanto para pés internacionais como pés de US Survey).

Quando estiver exportando ou importando a partir de um arquivo M5, se o projeto e o instrumento não estiverem usando as mesmas unidades, o Trimble Geomatics Office considera que "m" no arquivo M5 é metros e "ft" é pés internacionai.

Nível Digital Trimble DiNi

NOTA: O Trimble Geomatics Office não exporta para o instrumento de nível digital Trimble DiNi.

Para informações sobre a importação de um instrumento de nível digital Trimble DiNi, veja a opção de importação Arquivos do nível digital (*.dat, *.raw).


Arquivos Trimble 3300/3600/5600 Elta M5 (*.dat)

Use o Trimble Geomatics Office para:

  Importar arquivosTrimble 3300/3600/5600 Elta M5 (*.dat) para um projeto Trimble Geomatics Office.

  Exportar um projeto Trimble Geomatics Office para um arquivo de coordenadas Trimble 3300/3600/5600 Elta M5 (*.dat).

Arquivos também podem ser transferidos diretamente para e de o software embutido Trimble 3300, 3600 Elta ou 5600 Elta, através das opções de exportação e importação dos dispositivos de levantamento.

Certifique-se de que as opções do arquivo M5 para os arquivos Trimble 3300/3600/5600 Elta M5 (*.dat) estão configurados antes de importar ou exportar arquivos Elta M5.

Para importar arquivos Elta M5 (*.dat):

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção arquivos Trimble 3300/3600/5600 Elta M5 (*.dat).

4.	Clique Opções para abrir o diálogo arquivos M5 e configure o arquivo.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK.

Aparece o diálogo Abrir.

7.	Selecione o arquivo para importar e clique Abrir.

NOTAS:

 	 Coordenadas locais (relativas) (por exemplo, "neh" ou "xyz") no arquivo M5 são convertidos para coordenadas absolutas quando se importa.

  	Após a importação de um arquivo M5, todas as constantes do prisma aparecem no Trimble Geomatics Office como "?". Para mudar isso, no campo da constante do prisma da janela propriedades, insira a diferença entre a constante do prisma inserida no campo e a constante do atual do prisma. Por exemplo, se você inseriu uma constante do prisma de "20", e a constante real for de "5", insira "–15".

  	O Trimble Geomatics Office não suporta deltas de piquetagem ortogonal. Estes são convertidos para deltas de piquetagem Polar ao serem importados. A Trimble recomenda que configure o instrumento para armazenar somente delta de piquetagem.

  	O Trimble Geomatics Office não suporta ângulos horizontais que aumentem para a esquerda. Não use esta configuração no instrumento.

Configuração do Instrumento

Quando estiver importando observações médias de 2 faces de um instrumento Trimble 3600/5600 Elta, certifique-se de que o instrumento foi configurado para armazenar somente Valores Únicos. Se tanto os Valores únicos como os Médios forem selecionados, o Trimble Geomatics Office calculará valores incorretos. Igualmente, se somente Média for selecionada, o Trimble Geomatics Office mostra observações média como observações da Face 1.

O Trimble Geomatics Office pressupõe que os instrumentos Trimble 3600/5600 Elta sempre estão com as correções atmosféricas ativadas. Não desative estas correções no instrumento.

A opção de armazenamento R-MC deve ser usada nos instrumentos Trimble 3600/5600 Elta (quando possível) e armazenamento MEM/3 deve ser usado no instrumento Trimble 3300 para garantir que possui tanto os dados de coordenadas como aqueles de observação para os seus cálculos.

Posicionamento

Para garantir que o Trimble Geomatics Office interpreta dados, antes de medir, sempre efetue uma rotina de posicionamento no instrumento.

Registros de visada atrás que foram excluídos da configuração da estação ainda são importados para o Trimble Geomatics Office. Desative estas observações através da  janela Propriedades..

O Trimble Geomatics Office não suporta múltiplas visadas atrás. Quando pontos múltiplos de visada atrás são medidos na rotina de posicionamento, o Trimble Geomatics Office usará o último ponto da visada atrás.

Rotinas Elta não Suportadas

As seguintes rotinas do instrumento Elta produzem dados especiais que não são suportados pelo Trimble Geomatics Office. Contudo, na maioria das situações, o Trimble Geomatics Office importará as observações destas rotinas:

  Plano vertical

  Área

  Conexão de distâncias

  Transformações

  Linha de estrada “Lite”

  Múltiplos circuitos

  Plano 3 dimensionais

Para exportar o atual projeto do Trimble Geomatics Office para um arquivo Elta M5 (*.dat):

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Realce a opção arquivos Trimble 3300/3600/5600 Elta M5 (*.dat).

4.	Clique Opções para abrir o diálogo Opções do arquivo M5  e configure o arquivo.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK.

Aparece o diálogo Salvar como.

7.	Selecione uma pasta na qual salvar o arquivo.

8.	Insira um nome no campo Nome do arquivo e clique Salvar.


Arquivos Trimble Elta GPS Controller M5 (*.dat)

No Trimble Geomatics Office pode-se:

  Importar arquivos Elta GPS Controller M5 para um projeto Trimble Geomatics Office.

  Exportar de um projeto Trimble Geomatics Office para um arquivo de coordenadas Elta GPS Controller M5.

Também pode-se transferir arquivos diretamente para e de o software Trimble Elta GPS Controller através das opções de exportação e importação dos dispositivos de levantamento.

Certifique-se de que configurou as opções do arquivo M5 para os arquivos Trimble Elta GPS Controller M5 antes de importar ou exportar arquivos Elta GPS Controller M5.

Para importar arquivos Elta GPS Controller M5:

1.	Selecione Arquivo / Importar.

Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opções de arquivos Trimble Elta GPS Controller M5 (*.dat).

4.	Clique Opções para abrir o diálogo de opções do arquivo M5 e configure o arquivo.

5.	Clique OK para aceitar as configurações e voltar ao diálogo importar.

6.	Clique OK.

Aparece o diálogo Abrir.

7.	Selecione o arquivo para importar e clique Abrir.

NOTA: O Trimble Geomatics Office importa todas as coordenadas no arquivo M5 somente como pontos de grid. Para certificar-se de que as coordenadas do Trimble Geomatics Office condigam com as coordenadas do coletor Trimble Elta GPS, deve-se efetuar uma calibração (transformação) no campo no início do levantamento.

Para exportar o atual projeto Trimble Geomatics Office para um arquivo Elta GPS Controller M5:

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Realce a opção Arquivos Trimble Elta GPS Controller M5 (*.dat).

4.	Clique Opções para abrir o diálogo Opções do arquivo M5 e configure o arquivo.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK.

Aparece o diálogo Salvar como.

7.	Selecione a pasta na qual salvar o arquivo.

8.	Insira um nome no campo Nome do arquivo e clique Salvar.


Diálogo Opções do arquivo M5

Use o diálogo Opções do arquivo M5 para configurar os seguintes arquivos para importar e exportar:

  Arquivos Trimble 3300/3600/5600 Elta M5

  Arquivos Trimble Elta GPS Controller M5

Especifique o tipo de instrumentos, marcas do arquivo, configurações da coordenada e configurações de pontos duplicados  (para a importação).

Para acessar o diálogo de opções:

1.	Selecione Arquivo / Exportar (ou Importar).

2.	Selecione a guia Levantamento.

3.	Selecione uma das seguintes opções:

  Arquivos Trimble 3300/3600/5600 Elta M5 (*.dat)

  Arquivos Trimble Elta GPS Controller M5 (*.dat)

4.	Clique Opções.

Marcadores de arquivo

Selecione um dos seguintes:

  Default. (Trimble recomenda esta opção)

Clique o botão Avançado para visualizar as configurações do formato da linha e visualização do formato.

NOTA: Os valores padrões são diferentes, dependendo do tipo de instrumento selecionado.

  Definido pelo usuário

A opção definida pelo usuário lhe permite mudar as configurações do formato de linha e visualizar as mudanças na seção de visualização do formato. Selecione Definido pelo usuário e clique Avançado. No diálogo Opções do marcador avançado:

a.	Especifique a posição do caractere de início para o nome do ponto, código e descrição.

b.	Especifique as larguras do ponto do nome do ponto, código e descrição.

c.	Insira um número de marcadores.

NOTA: Se as configurações do formato de linha definido pelo usuário forem invalidas, o Trimble Geomatics Office requer ajustes válidos de configuração.

Configurações da coordenada

A partir das listas da Ordem da coordenada e Descida da elevação, selecione a ordem da coordenada e as etiquetas da coordenada no arquivo a ser importado ou exportado.

NOTAS:

Os campos disponíveis dependem do tipo de instrumento selecionado.

Nomes de pontos, códigos e descrições mais compridos que o espaço para eles disponível são truncados na exportação.

Pontos com nomes alfanuméricos não são exportados para o instrumento Trimble 3300.


Pontos - Perspectiva Geral

Pontos são o foco principal de um projeto Trimble Geomatics Office. Pontos são adicionados ao projeto sempre que você importar dados, ou adicionar um ponto usando o diálogo Inserir Ponto ou o diálogo Inserir Pontos por Azimute e Distância.

Pontos são visíveis tanto na visualização do Levantamento como na visualização do Plano. Para visualizar os detalhes de um Ponto, selecione-o e abra a janela Propriedades.

Um Ponto tem uma posição calculada, a qual é determinada por recomputação. Essa posição é a melhor posição para o Ponto usando quaisquer coordenadas e observações digitadas para o Ponto.

Na visualização do Levantamento, Pontos aparecem como pontos, com quaisquer observações entre eles sendo mostradas. Na visualização do Plano, Pontos são exibidos de acordo com o estilo de Ponto deles. O banco de dados permite Pontos com nomes duplicados.


Diálogo Inserir Pontos

Use este diálogo para inserir Pontos no banco de dados. Os campos mudam dependendo de qual opção você escolhe no campo Tipo de Coordenadas.

Para acessá-lo, faça um dentre os seguintes:

  Da visualização do Levantamento, selecione Inserir / Pontos.

  Da visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Pontos.

  Clique a ferramenta Inserir Pontos [image].

Inserir

Clique Inserir para inserir o Ponto ao banco de dados. O diálogo continua disponível para adicionar outro (novo) Ponto.

NOTA: Quando você estiver adicionando o primeiro grid ou posição GPS à um projeto com uma projeção padrão indefinida (Transversa de Mercator), o rimble Geomatics Office apresenta um diálogo apropriado para ajudá-lo a corretamente inicializar a projeção.

Fechar

Clique Fechar para terminar de inserir Pontos e sair do diálogo.

Nome

Digite um nome usando o teclado. Você pode digitar um nome com até 16 caracteres.

Você não pode usar os seguintes caracteres em nomes:

  chaves {}

  colchetes []

  parênteses ()

  símbolo de percentagem %

  sinal de igual =

  aspas “ ou ‘

NOTA: Quando você estiver inserindo Pontos em sucessão, os nomes são automaticamente incrementados se o nome de Ponto previamente digitado terminar em um número.

NOTA: Para estabelecer o nome de Ponto padrão no diálogo Propriedades do projeto, selecione a guia Unidades e Formato e então use o nome do Ponto Start auto do campo.

Grupo de detalhes de coordenadas

Para cada componente de coordenada (horizontal, elevação, altura) selecione a qualidade apropriada. Essas qualidades são usadas por recomputação para determinar a melhor posição para o Ponto.

O grupo Detalhes de coordenadas muda dependendo se a seleção foi a opção deste diálogo foi WGS-84, Grid ou Local. Cada grupo de Detalhes de coordenadas diferente representa uma visualização da coordenada.

Se você selecionou a opção Grid, os seguintes campos aparecem:

Norte	Use preenchimento de campo ou digite um valor desde o teclado. Se você usar preenchimento de campo, os campos Norte e Leste são preenchidos com a posição onde você clicou.
Leste	Use preenchimento de campo ou digite um valor desde o teclado. Se você usar preenchimento de campo, os campos Norte e Leste são preenchidos com a posição onde você clicou.

Se você selecionou a opção WGS-84 ou Local, e tem o WGS-84 Exibido como configuração (na guia Unidades e Formatos do diálogo de Propriedades do Projeto) configurado para L,L,H, então os seguintes campos aparecem:

Latitude	Use preenchimento de campo ou digite um valor desde o teclado. Se você usar preenchimento de campo, os campos Latitude e Longitude são preenchidos com a posição onde você clicou.
Longitude	Use preenchimento de campo ou digite um valor desde o teclado. Se você usar preenchimento de campo, os campos Latitude e Longitude são preenchidos com a posição onde você clicou.

Os seguintes campos aparecem com qualquer opção:

Elevação	Digite um valor desde o teclado, ou Clique em um Ponto existente. Se você Clicar em um Ponto existente, o valor de Elevação para aquele Ponto será preenchido no campo  Elevação.
Altura	Use preenchimento de campo ou digite um valor desde o teclado. Se você Clicar em um Ponto existente, o valor da Altura para aquele Ponto será preenchido no campo Altura.
SUGESTÃO: Para posicionar um Ponto ao longo de uma linha de observação na visualização do Levantamento ou qualquer linha de trabalho de linha na visualização do Plano, mantenha a tecla Ctrl pressionada enquanto estiver usando preenchimento de campo. Você pode usar preenchimento de campo para conseguir uma coordenada aproximada e então editar este valor.

NOTA: Se você tem o WGS-84 exibido conforme configurado na guia Unidades e Formato do diálogo de Propriedades do Projeto configurado para X,Y,Z; então os campos X,Y,Z aparecem. Use preenchimento de campo ou digite um valor usando o teclado. Se você usar preenchimento de campo, os campos são preenchidos com a posição onde você Clicou.

Tipo de Coordenada

Neste campo, selecione a opção (WGS-84, Local, Grid) que você quiser usar para salvar as coordenadas no banco de dados. Selecionando as mudanças de tipo de coordenadas a visualização da coordenada para a mesma configuração que o tipo da coordenada.

NOTA: Se você quiser editar campos no grupo de detalhes de Coordenada, as configurações do tipo de coordenada e visualização da coordenada devem ser as mesmas.

Grupo de detalhes de CAD

Este grupo contém todos os campos para Pontos visíveis na visualização do Plano.

Código de característica

Digite um valor desde o teclado, ou Clique em um Ponto existente. Se você clicar em um ponto existente, o valor do Código de característica para aquele Ponto será preenchido no campo Código de Característica.

Descrição

Digite um valor desde o teclado, ou Clique em um Ponto existente. Se você clicar em um ponto existente, o valor da descrição para aquele Ponto será preenchido no campo Descrição.

Camada

Faça um dentre os seguintes:

  Selecione uma camada existente na lista.

  Digite uma nova camada usando o teclado. O diálogo de Camada Nova aparece.

  Clique em um Ponto existente. Se você Clicar em um Ponto existente, o valor da Camada para aquele Ponto será preenchido no campo Camada.

Estilo de Ponto

Faça um dentre os seguintes:

  Selecione um estilo de Ponto existente na lista.

  Digite um novo estilo de Ponto usando o teclado. O diálogo Criar Estilo de Ponto aparece.

  Clique em um Ponto existente. Se você Clicar em um Ponto existente, o valor de estilo de Ponto para aquele Ponto será preenchido no campo Estilo de Ponto.


Pontos por comandos de Azimute e Distância

Use este comando para inserir Pontos por um azimute e distância de um Ponto conhecido.

Para acessá-lo, Selecione Inserir / Pontos por Azimute and Distância.

O diálogo Inserir Pontos por Azimute e Distância aparece.


Diálogo Inserir Pontos por Azimute e Distância

Use este diálogo para inserir Pontos por um azimute e distância de um Ponto conhecido.

Para acessá-lo, faça um dentre os seguintes:

  Selecione Inserir / Pontos por azimute e distância.

  Na visualização do Plano, Clique na ferramenta Adicionar Pontos por azimute e distância [image].

NOTA: As qualidades para o Ponto novo são as mesmas que as do De Ponto. Se uma elevação delta não é especificada, os campos Elevação e Altura para o Ponto novo serão desconhecidos.

Nome do Ponto

Digite o nome do usando o teclado. Você pode digitar um nome de até 16 caracteres de comprimento.

Você não pode usar os seguintes caracteres em nomes:

  chaves {}

  colchetes []

  parênteses ()

  símbolo de percentagem %

  sinal de igual =

  aspas “ ou ‘

De Ponto

Digite um nome de Ponto existente usando o teclado, ou Clique em um Ponto existente.

Azimute

Esse campo depende da configuração do tipo de Azimute. Digite um valor de azimute no formato estabelecido para o formato de Ângulo (graus) na guia Unidades e Formatos.

Distância

Este campo depende da configuração para a distância Exibida como campo na guia Unidades e Formatos. Se você não especificar uma unidade, as unidades atuais para o projeto são usadas; no entanto você pode especificar m, ift (pés internacionais) ou sft (pés de Levantamento nos EUA)

Elevação Delta

Este valor é adicionado à elevação do De Ponto para derivar uma elevação para o Ponto novo. Uma mudança positiva significa que o Ponto novo tem uma elevação maior que o De Ponto. Se você não especificar uma unidade, as unidades atuais para o projeto são usadas; no entanto você pode especificar m, ift (pés internacionais) ou sft (pés de Levantamento nos EUA). Se você não especificar uma elevação delta, a elevação do Ponto novo será nula.

Tipo de Azimute

Use este grupo para selecionar o grid ou azimute de avanço de seção normal.

 Grid – Selecione esta opção para exibir o Azimute de Grid

 Avanço de seção normal – Selecione esta opção para exibir o azimute de avanço de seção normal

Método

Use este grupo para selecionar como o software prepara o diálogo após um Ponto Ter sido inserido.

  Seqüencial – Quando um Ponto novo é adicionado, esta opção insere o nome do Ponto novo no campo do De Ponto. Use esta opção para digitar uma transversa.

  Radial – Mantém o mesmo nome do De Ponto. Use esta opção para digitar radiações para Pontos do mesmo Ponto.

Unir

Use esta caixa de verificação para desenhar uma linha entre o “de” Ponto e o Ponto novo. A linha é adicionada à camada atual e é desenhada no estilo de linha padrão para a camada atual. Somente é visível na Visualização do Plano.


Diálogo Inserir Azimute

Um Azimute é usado para orientar observações terrestres. Use este diálogo para inserir um Azimute entre dois Pontos.

Para acessá-lo:

  Na Visualização do Levantamento, Selecione Inserir / Azimute.

De ponto e para ponto

Nestes campos, use o teclado ou preenchimento de campo para digitar um nome de Ponto existente.

Azimute

Se inserir pontos “de” e “para” existentes, então um valor de Azimute calculado é mostrado. Se necessário, você pode editar este valor e a qualidade do azimute. O azimute exibido neste campo depende da visualização do azimute especificada abaixo.

Se um Azimute já existe para o par do seu Ponto, será perguntado se você deseja sobrescrevê-lo.

Tipo do azimute

Use este campo para determinar como o Azimute é salvado no banco de dados; isto é, como um grid ou azimute de avanço de seção normal.

Avanço de seção normal/azimute

Selecione uma destas opções para determinar como suas coordenadas devem ser exibidas no diálogo Inserir azimute; isto é, a visualização do azimute.

NOTA: Se desejar editar os campos deste diálogo, o tipo de azimute e a visualização do azimute devem ser as mesmas.

NOTA: Se o “para” Ponto não tem uma coordenada, a conversão entre o azimute de grid e o azimute de avanço de seção normal não pode ser calculada, então o azimute é exibido como Nulo.

Inserir

Use este botão para inserir o azimute no projeto. O azimute é exibido entre os dois Pontos de definição, e com uma flecha indicando a direção.

Fechar

Use este botão para fechar o diálogo.


    Comando de Linhas

Use este comando para inserir linha no banco de dados.

Para acessá-lo, faça um dentre os seguintes:

  Selecione Inserir / Linhas.

O diálogo Inserir Trabalho de Linha aparece com a guia Linha selecionada.


    Diálogo Inserir Trabalho de Linha

Use este diálogo para inserir um trabalho de linha (linha, curva, ou arco) no banco de dados.

Para acessá-lo, faça um dentre os seguintes:

Linhas	Selecione a ferramenta Inserir Linhas [image].   Selecione Inserir / Linhas.
Curvas	Selecione a ferramenta Inserir Curvas [image].    Selecione Inserir / Curvas.
Arcos	Selecione a ferramenta Inserir Arcos  [image].    Selecione Inserir / Arcos.

O diálogo Inserir Trabalho de Linha aparece com a guia apropriado selecionado.

Use preenchimento de campo ou digite os detalhes com o teclado para completar o diálogo. Para rapidamente adicionar trabalho de linha, Clique duas vezes em preenchimento de campo enquanto você estiver no campo Para Ponto.

Você pode mudar o tipo de trabalho de linha a qualquer momento. Neste caso, é possível unir seqüências de Linhas, Curvas, Arcos, ou qualquer combinação.

Você pode adicionar três tipos de trabalho de linha no banco de dados:

  Linhas

  Arcos

  Curvas

Inserir

Clique Inserir para adicionar linha de trabalho ao projeto e manter o diálogo aberto para adicionar linha de trabalho nova.

O valor do “de” Ponto torna-se o valor “para” Ponto pronto para o próximo pedaço de trabalho de linha.


    Linhas - Perspectiva Geral

Mais Informações

Como ...	Diálogo	Veja Também
Perspectiva Geral

Você pode inserir Linhas entre Pontos no Trimble Geomatics Office. Insira Linhas no seu projeto para definir limites de linha (por exemplo Linhas de cerca, edificações, e Linhas de canos).

Linhas aparecem na janela de gráficos quando você visualiza seu projeto na Visualização do Plano. Para visualizar as propriedades da linha, selecione a linha e abra a Janela de propriedades.

Linhas são exibidas de acordo com seu estilo de linha. Você pode usar os estilos de linhas Trimble ou criar o seu próprio.

Linhas podem ser exportadas em alguns formatos (por exemplo os formatos AutoCAD e TRIMMAP).


    Arcos - Perspectiva Geral

Mais Informações

Como ...	Diálogo	Veja Também
Perspectiva Geral

Você pode criar arcos para exibir arcos circulares suaves entre Pontos.

Arcos aparecem na janela de gráficos quando você visualiza seu projeto na Visualização do Plano. Para visualizar as propriedades do arco, selecione o arco e abra a Janela de propriedades.

Arcos são exibidos de acordo com seu estilo de linha. Você pode usar os estilos de linha Trimble ou criar o seu próprio.

Arcos são exportadas em alguns formatos (por exemplo os formatos AutoCAD e TRIMMAP).


    Curvas - Perspectiva Geral

Mais Informações

Como ...	Diálogo	Veja Também
Perspectiva Geral

Insira Curvas para criar Curvas com ajuste ótimo entre pontos. Use Curvas para definir limites que não são Linhas retas (por exemplo cursos de água ou rastros).

Curvas aparecem na janela de gráficos quando você visualiza se projeto na Visualização do Plano.

Curvas são exibidas de acordo com seu estilo de linha. Você pode usar os estilos de linhas Trimble ou criar o seu próprio.

Cada vez que você insere uma curva de um Ponto que é usado em outra curva, o software Trimble Geomatics Office recalcula a curva existente para assegurar que uma curva suave seja exibida.

Curvas podem ser exportadas em alguns formatos (por exemplo os formatos AutoCAD e TRIMMAP).


    Diálogo Inserir Trabalho de linha - guia Linha

Use este diálogo para inserir Linhas no banco de dados.

Para acessá-lo, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Linhas.

  Selecione a ferramenta Inserir Linhas [image].

O Diálogo Inserir Trabalho de Linha aparece com a guia Linha selecionada.

De Ponto

Faça um dentre os seguintes:

  Use o preenchimento de campo para selecionar o primeiro Ponto que você quer usar para definir a linha.

  Digite o nome do Ponto para o primeiro Ponto que você quer usar para definir a linha.

Para Ponto

Faça um dentre os seguintes:

  Use o preenchimento de campo para selecionar o segundo Ponto que você quer usar para definir a linha.

  Digite o nome do Ponto para o segundo Ponto que você quer usar para definir a linha.

Camada

Faça um dentre os seguintes:

  Selecione a camada na qual você quer a linha adicionada.

  Digite um nome de camada nova para criar uma camada nova. O diálogo de Camada Nova aparece.

Estilo de Linha

Selecione o estilo de linha que você quer usar para exibir a linha. Os estilos disponíveis são os estilos de linha no Diálogo de Estilos CAD.

Inserir

Clique Inserir para inserir a linha. O Ponto selecionado no campo Para Ponto é selecionado no campo De Ponto por padrão. Você pode mudar isso se necessário.

Fechar

Clique Fechar para parar de inserir Linhas.


    Comandos de Arco

Use este comando para inserir arcos no banco de dados.

Para acessá-lo, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Arcos.

  Selecione a ferramenta Inserir Arco [image].

O Diálogo Inserir Trabalho de Linha aparece com a guia arco selecionada.


    Diálogo Inserir Trabalho de Linha - guia Arco

Use este diálogo para inserir Arcos no banco de dados.

Para acessá-lo, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Arcos.

  Selecione a ferramenta Inserir Arco [image].

O Diálogo Inserir Trabalho de Linha aparece com a guia arco selecionada.

De Ponto

Faça um dentre os seguintes:

  Use o preenchimento de campo e Clique no Ponto apropriado.

  Use o teclado para digitar o nome do Ponto.

Para Ponto

Faça um dentre os seguintes:

  Use o preenchimento de campo e Clique no Ponto apropriado.

 Use o teclado para digitar o nome do Ponto.

Ponto de Centro

Para usar um Ponto existente como o centro do arco, faça um dentre os seguintes:

  Digite o nome de um Ponto existente.

  Use o preenchimento de campo para selecionar um Ponto existente.

As coordenadas para o Ponto são copiadas para os campos Norte do centro e Leste do centro.

Norte do Centro, Leste do Centro

Para usar coordenadas como o centro do arco, use o preenchimento de campo para Clicar em uma localização na janela de gráficos. As coordenadas são copiadas para esses campos.

NOTA: Se você digitar ambos o Ponto do Centro e as coordenadas do centro, o Ponto do centro é usado.

Pequeno Arco

Selecione a opção Verdadeira se você quiser criar um arco pequeno. Do contrário, selecione Falso. Sempre há dois arcos possíveis entre dois Pontos, os quais juntos definem um círculo. Essa configuração define quais arcos você quer desenhar. Isso é explicado na seguinte figura:

NOTA: Centro do arco é o Ponto do centro de uma linha reta entre dois pontos ou as coordenadas dos campos Norte do centro e Leste do centro.

Camada

Faça um dentre os seguintes:

  Selecione a camada na qual você quer o arco adicionado.

  Digite o nome da camada nova para criar uma camada nova. O Diálogo Camada Nova aparece.

Estilo de Linha

Selecione o estilo de linha que você quer usar para exibir o arco. Os estilos disponíveis são os estilos do arco no Diálogo de Estilos CAD.

Inserir

Clique Inserir para inserir o arco. O Ponto selecionado no campo Para Ponto é selecionado no campo De Ponto por padrão. Você pode mudar isso se necessário.

Fechar

Clique em Fechar para parar de inserir Arcos.


    Comando de Curvas

Use este comando para inserir Curvas no banco de dados.

Para acessá-lo, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Curvas.

  Selecione a ferramenta Inserir Curva  [image].

O Diálogo Inserir Trabalho de Linha aparece com a guia Curva selecionada.


  Diálogo Inserir Trabalho de Linha - guia Curva

Use este diálogo para inserir Curvas no banco de dados.

Para acessá-lo, da Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Curvas.

  Selecione a ferramenta Inserir Curva [image].

O Diálogo Inserir Trabalho de Linha aparece com a guia Curva selecionada.

De Ponto

Faça um dentre os seguintes:

  Use o preenchimento de campo e Clique nos Pontos apropriados.

  Use o teclado para digitar o nome(s) do(s) Ponto(s).

Para Ponto

Faça um dentre os seguintes:

  Use o preenchimento de campo e Clique nos Pontos apropriados.

  Use o teclado para digitar o nome(s) do(s) Ponto(s).

Tangente de Entrada, Tangente de Saída

Para automaticamente digitar os valores de tangente baseados nos Pontos usados para definir a curva, deixe os valore como <Automático>. Você pode digitar seus próprios valores de tangente se necessário.

Vagalhão

Digite um valor entre 0 e 1. O Vagalhão define a espessura da curva. Quanto mais alto o vagalhão, maior a espessura da curva.

Camada

Faça um dentre os seguintes:

  Selecione a camada na qual você quer a curva inserida.

  Digite um nome de camada nova para criar uma camada nova. O Diálogo Camada Nova aparece.

Estilo de Linha

Selecione o estilo de linha que você quer usar para exibir a curva. Os estilos disponíveis são os estilos de linha no Diálogo de Estilos CAD.

Inserir

Clique Inserir para inserir a curva. O Ponto selecionado no campo Para Ponto é selecionado no campo De Ponto por padrão. Você pode mudar isso se necessário.

Fechar

Clique em Fechar para parar de inserir Curvas.


    Comando de Texto

Use este comando para abrir o Diálogo Inserir Texto.

Para acessá-lo, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Texto.

  Clique na ferramenta Inserir Texto [image].


    Diálogo Inserir Texto

Use este diálogo para inserir texto novo no banco de dados.

Para acessá-lo, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Texto.

  Clique a ferramenta Inserir Texto [image].

Expressão Texto

Digite o texto que você quer que apareça. Para usar códigos de campos (por exemplo, o título do projeto) clique com o botão da direita e selecione Campos do menu de atalhos.

Norte

Para digitar o valor de Norte para a localização do texto, faça um dentre os seguintes:

  Use o preenchimento de campo Clicando numa localização na janela de gráficos.

  Digite o valor de Norte usando o teclado.

Leste

Para digitar o valor de Leste para a localização do texto, faça um dentre os seguintes:

 Use o preenchimento de campo Clicando numa localização na janela de gráficos.

 Digite o valor de leste usando o teclado.

Orientação

Digite uma orientação para a entidade do texto. Se você não especificar uma orientação, o texto é exibido horizontalmente através da janela.

Tipo de Âncora

Especifique onde o texto está localizado com respeito aos valores de Norte e Leste. Selecione um valor da lista.

Camada

Selecione a camada para a qual você quer adicionar texto da lista. Para digitar texto em uma camada nova, digite um novo nome. O Diálogo de Camada Nova aparece.

Estilo de Texto

Selecione na lista o estilo de texto para a entidade texto. Se você quer usar o estilo de texto padrão estabelecido para a camada para a qual você está adicionando texto, selecione a opção <Por Camada>.

Para editar e criar estilos de texto, selecione Editar / Estilos.

Inserir

Clique Inserir  para adicionar o texto ao projeto e manter o Diálogo aberto para adicionar mais texto.


Texto - Perspectiva Geral

Mais Informações

Como ...	Diálogo	Veja Também
Perspectiva Geral

Você pode adicionar texto em um projeto. Por exemplo, adicione texto para descrever figuras, ou para exibir cabeçalhos de projetos.

O texto aparece na janela de gráficos. Para visualizar as propriedades do texto, selecione o texto e abra a janela de Propriedades. Você pode também arrastar texto para uma localização nova na janela de gráficos, ou girar o texto.

O texto é exportado em alguns formatos (por exemplo formatos AutoCAD e TRIMMAP).


    Anotações - Perspectiva Geral

Mais Informações

Como ...	Diálogo	Veja Também
Perspectiva Geral

Anotações são texto associado com entidades (Pontos, Linhas, e Arcos). O texto que aparece é definido por um modelo de anotação.

Modelos de anotação definem:

  o que é anotado

  a posição da anotação em relação à entidade

Modelos de anotação podem conter combinações de texto definido por usuário e códigos de campo. Códigos de campo são expandidos sempre que o campo sendo anotado muda. Por exemplo, se um Ponto é anotado com sua elevação, e a elevação para o Ponto muda, a anotação é atualizada.

Anotações são armazenadas no projeto.

Modelos de Anotação

A Trimble fornece alguns modelos de anotações pré-definidos para você. Se você processar códigos de características e a biblioteca de características e atributos contém modelos de anotação, eles são adicionados a essa lista de modelos de anotação. Como os modelos de anotação da biblioteca de atributos e características não têm uma configuração de estilo de texto, o estilo de texto padrão é usado quando os modelos de anotação são adicionados ao projeto Trimble Geomatics Office.

Adicionando anotações

Para adicionar anotações, desde a Visualização do Plano, faça um dentre os seguintes:

  Selecione Inserir / Anotações.

  Selecione Editar / Modelos de Anotação. Clique Novo.

  Use processamento de código de característica para anotar entidades. Para mais informações, veja a ajuda do utilitário Editor de Atributos e Características Trimble.

NOTA: Para editar Anotações existentes, use a janela de Propriedades.


    Comando de Anotações

Use este comando para anotar os Pontos, Linhas, ou Arcos selecionados.

Para acessá-lo, Selecione Inserir / Anotações.

O Diálogo Anotar aparece.


    Diálogo Anotar

 Perspectiva Geral e Mais Informações

Use este Diálogo para anotar os Pontos, Linhas, ou Arcos selecionados.

Para acessá-lo, Selecione Inserir / Anotações.

A posição de inserção das anotações das entidades com tamanho de papel é determinada com referência à dimensão da entidade e à escala de traçado estabelecida no Arquivo / Diálogo de Configuração de Folha. Um vão livre de um terço da altura do caracter é adicionada entre a anotação e a entidade anotada.

Modelo de Anotação

Selecione um modelo da lista.

Reter Anotações existentes

Selecione esta caixa de verificação para reter Anotações existentes que tenham sido designadas às entidades a serem anotadas. As Anotações novas são adicionadas às já existentes, mesmo se elas não estão na mesma localização.

SUGESTÃO: Você pode usar essa facilidade para fornecer Anotações múltiplas para entidades separadas em diferentes camadas no Diálogo de Modelo de  Anotação.

Se você desmarcar esta caixa de verificação, anotações designadas às entidades a serem anotadas são removidas do banco de dados antes que a nova anotação seja adicionada.

Anotar

Há duas formas de anotar entidades:

Seleção	Selecione esta opção para anotar as entidades selecionadas.
Todo o banco de dados	Selecione esta opção para anotar todas as entidades.
Estes botões não estão disponíveis quando nada é selecionado. Neste caso, todas as entidades são anotadas.

Remover

Para remover todas as anotações das entidades selecionadas, faça um dentre os seguintes:

  Clique Remover.

  Selecione Anotações e escolha Editar / Apagar.

Modelos

Clique Modelos para exibir o diálogo Modelos de Anotação. Use este diálogo para selecionar o Modelo de Anotação que você quer criar, modificar, ou apagar. Para mais Informações, veja diálogo Modelos de Anotação.


    Diálogo Modelos de Anotação

 Perspectiva Geral e Mais Informações

Use este diálogo para gerenciar Modelos de Anotação.

Para acessá-lo:

1.	Selecione Inserir / Anotações.

2.	Clique em Modelos.

Um modelo de anotação define o estilo, posição, e conteúdo de uma ou mais anotações. Uma vez designada, cada anotação é uma peça discreta de informação de texto independente do modelo de anotação. Anotações são armazenada no projeto.

O Trimble Geomatics Office usa códigos de campo para especificar os valores que a anotação mostra. Uma anotação é viva – quaisquer códigos de campo são re-expandidos sempre que a entidade mãe muda.

Modelos de Anotação

Esta lista contém todos os Modelos de Anotação atualmente no projeto.

Para modificar ou apagar um modelo de anotação existente, realce o nome do modelo apropriado.

Novo

Clique em Novo para criar um modelo de anotação novo. O diálogo Modelo de anotação aparece.

Editar

Clique em Editar para modificar um modelo de anotação existente. O diálogo Modelo de anotação aparece.

Apagar

Clique em Apagar para apagar o Modelo de anotação selecionado. Isso apaga-o do projeto.


    Diálogo Modelo de anotação

 Perspectiva Geral e Mais Informações

Use as guias neste diálogo para configurar o modelo de anotação sendo criado ou modificado.

Para acessá-lo:

1.	Faça um dentre os seguintes:

  Selecione Inserir / Anotações. Clique em Modelos.

  Selecione Editar / Modelos de Anotação.

O diálogo Modelos de Anotação aparece.

2.	Clique em Novo ou Editar.

Use as quatro guias para definir o modelo de anotação:

  Configurações

  Pontos

  Linhas

  Arcos


    Diálogo Modelos de Anotação - guia Configurações

 Perspectiva Geral e Mais Informações

Use a guia Configurações para editar as configurações gerais para o modelo de anotação.

Para acessá-lo:

1.	Selecione Inserir / Anotações.

2.	Clique em Modelos.

3.	Clique em Novo ou Editar.

4.	Selecione a guia Configurações.

Nome

Digite um nome para visualizar ou renomear o nome atual do modelo.

Estilo de Texto

Define o estilo de texto para a anotação.

Para definir estilos de texto para a anotação, selecione Editar / Estilos da Visualização do Plano. Se você selecionar a opção <Por Camada>, o estilo de texto é herdado pela configuração de estilo de texto para a camada para a qual a anotação é adicionada.

Para estabelecer padrões de camada, selecione Editar / Camadas da Visualização do Plano.

Orientação de Anotação de Ponto

Digite a orientação de anotação de ponto que você requer. Você pode usar qualquer orientação de 00°00'00" a 360°00'00". O padrão é 90°00'00".

Camada

Posicione em	Para posicionar as anotações em uma camada especificada, use esta opção. Você pode tanto selecionar da lista de camadas existentes como digitar um nome novo de camada. Se você digitar um nome novo de camada, esta camada é automaticamente criada quando o modelo é aplicado.

Posicione na camada atual

Para posicionar as anotações na camada atual, use esta opção. A camada atual é exibida na ferramenta de Seleção de Camada na Visualização do Plano, e no diálogo Camadas.

Posicione na camada da entidade anotada

Para posicionar anotações na camada da entidade anotada, use esta opção.


 Diálogo Modelo de anotação - guia Pontos

 Perspectiva Geral e Mais Informações

Use a guia Pontos para definir Anotações para Pontos, quando os Pontos são anotados usando este modelo.

Para acessá-lo:

1.	Selecione Inserir / Anotações.

2.	Clique em Modelos.

3.	Clique em Novo ou Editar.

4.	Selecione a guia Pontos.

O texto de anotação em cada uma das quatro posições (Esquerda, Sobre, Direita, Flutuante) pode ter um máximo de 100 caracteres alfanuméricos. Os valores em cada posição podem consistir de texto definido pelo usuário e códigos de campo. Os códigos de campo são usados para extrair detalhes de anotação do banco de dados. Por exemplo, o código do campo ‘[nome]’ é usado para anotar um Ponto com seu nome—neste caso à direita do Ponto.

Você pode anotar um Ponto com qualquer combinação de quatro posições padrão. Para mover uma anotação de uma posição padrão use o mouse para arrastar a anotação para uma localização mais adequada. A anotação ainda é ligada ao Ponto.

Localização	A Anotação exibe:

Esquerda	para a Esquerda do Ponto.

Sobre	sobre o Ponto.

Direita	para a Direita do Ponto.

Flutuante	em uma posição afastada do Ponto mas ligada ao Ponto.


 Diálogo Modelo de anotação - guia Linhas

Use a guia Linhas para definir Anotações para Linhas quando as Linhas são anotadas usando este modelo.

Para acessá-lo:

1.	Selecione Inserir / Anotações.

2.	Clique em Modelos.

3.	Clique Novo ou Editar.

4.	Selecione a guia Linhas.

O texto de anotação em cada uma das sete posições (veja abaixo) pode ser até no máximo de 100 caracteres alfanuméricos. Os valores em cada posição podem consistir de texto definido pelo usuário e códigos de campo. Os códigos de campo são usados para extrair detalhes de anotação do banco de dados. Por exemplo, o código do campo ‘[Azimute]’ é usado para anotar a linha com seu valor de Azimute (neste caso acima ao centro da linha) e o código de campo ‘[distância]’ para anotar uma linha com seu valor de distância (neste caso abaixo ao centro da linha)

Você pode anotar uma linha com qualquer combinação de sete posições padrão. Para mover uma anotação de uma posição padrão use o mouse para arrastar a anotação para uma localização mais adequada. A anotação ainda é ligada à linha.

Localização	A Anotação exibe:

Acima Esquerda	Acima e na extremidade esquerda da linha.

Acima centro	Acima e no centro da linha.

Acima Direita	Acima e na extremidade direita da linha.

Abaixo Esquerda	Abaixo e na extremidade esquerda da linha.

Abaixo centro	Abaixo e no centro da linha.

Abaixo Direita	Abaixo e na extremidade direita da linha.

Flutuante	em uma posição afastada, mas ligada à linha.


  Diálogo Modelo de Anotação - guia Arcos

Use a guia Arcos para definir Anotações para Arcos, quando os Arcos são anotados usando este modelo.

Para acessá-lo:

1.	Selecione Inserir / Anotações.

2.	Clique em Modelos.

3.	Clique Novo ou Editar.

4.	Selecione a guia Arcos.

O texto de anotação em cada uma das sete posições (veja abaixo) pode ter um máximo de 100 caracteres alfanuméricos. Os valores em cada localização podem consistir de texto definido pelo usuário e códigos de campo. Os códigos de campo são usados para extrair detalhes de anotação do banco de dados. Por exemplo, o código do campo ‘[comprimento]’ para anotar um arco com seu valor de comprimento (neste caso acima ao centro do arco) e o código de campo ‘[Raio]’ para anotar um arco com se valor de raio (neste caso abaixo ao centro do arco).

Você pode anotar um arco com qualquer combinação de sete posições padrão. Para mover uma anotação de uma posição padrão use o mouse para arrastar a anotação para uma localização mais adequada. A anotação ainda é ligada ao arco.

Localização	A Anotação exibe:

Acima esquerda	Acima e na extremidade esquerda do arco.

Acima centro	Acima e no centro do arco.

Acima direita	Acima e na extremidade direita do arco.

Abaixo esquerda	Abaixo e na extremidade esquerda do arco.

Abaixo centro	Abaixo e no centro do arco.

Abaixo direita	Abaixo e na extremidade direita do arco.

Flutuante	em uma posição afastada, mas ligada ao arco.


Comando de Pontos

Use este comando para inserir Pontos novos no banco de dados.

Para acessar este comando, selecione Inserir / Ponto.

O diálogo Inserir Ponto aparece.


Adicionando Entidades ao Projeto

Você pode adicionar entidades no projeto desde dentro do Trimble Geomatics Office.  Uma entidade é definida como um ponto, linha, arco, curva, anotação, ou texto. Você também pode adicionar pontos na Visualização do Levantamento usando o menu Inserir.

  Para informações sobre cada tipo de entidade, use os seguintes vínculos:

  Pontos

  Linhas

  Arcos

  Anotações

  texto


 Trabalho de Linha para Comando de Observações Atual

Use este comando para criar um trabalho de linha CAD para tipos de observação selecionados. Para acessá-lo, da Visualização do Plano, selecione Inserir / Linhas de Observação.

O diálogo Inserir Trabalho de Linha para Observações aparece.


 Diálogo Inserir Trabalho de Linha para Observações Atuais

Use este diálogo para criar Linhas CAD para todas as observações no projeto.

Para acessá-lo, da Visualização do Plano, selecione Inserir / Trabalho de Linha para Observações Atuais.

Tipo de Observações

Exibe o tipo de observação. Possíveis tipos são:

Vetores RTK
Vetores Pós-processados	Estático, Faststatic e  Cinemático Pós-processado
Observações Terrestres	Convencional, Laser Rangefinder e Reduzido
Camada CAD

Selecione a camada para adicionar linhas ao tipo de observação. As linhas são desenhadas usando o estilo de linha padrão para a camada que você selecionou. Se você digita uma camada nova usando o teclado, o diálogo Camada Nova aparece.


Propriedades do Projeto - Perspectiva geral

Mais informações

Como ...	Diálogo
Perspectiva geral

As propriedades de um projeto contêm todas as configurações de todo o projeto (por exemplo, o sistema de coordenadas e unidades de apresentação). Você pode mudá-las a qualquer momento. Quando você muda uma propriedade do projeto, o projeto é atualizado para refletir a mudança. Algumas propriedades do projeto podem mudar dados do projeto (por exemplo, mudando o sistema de coordenadas). Portanto, tenha cuidado ao mudar uma propriedade do projeto que muda dados existentes.

Você não pode desfazer nenhuma mudança em propriedades de um projeto.


Diálogo de Propriedades do Projeto

Use este diálogo para configurar as configurações de todo o projeto.

Para acessá-lo:

  Selecione arquivo / Propriedades do projeto.

O diálogo Propriedades do projeto têm as seguintes guias:

  Guia sistema de coordenadas

  Guia relatório

  Guia detalhes do projeto

  Guia recomputação

  Guia unidades e formato

  Guia características


Diálogo de Propriedades do Projeto - guia Detalhes do Projeto

Use esta guia para digitar dados sobre o projeto/modelo que você quer incluído nos relatórios e traçados.

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Selecione a guia detalhes do projeto.

NOTA: Na lista de Detalhes do projeto, clique com o botão da direita para acessar o menu de atalho que permite que você renomeie ou apague itens existentes, e insira outros novos.

Todos os campos nesta guia são opcionais.

Título

Digite um título para o projeto/modelo atual neste campo.

Descrição

Digite uma descrição do projeto/modelo se requerida.

Referência

Digite uma número de referência de projeto para possibilitar você a ligar o projeto a seu processo de custo de escritório.

Topógrafo de Campo

Digite o nome do topógrafo que completou o trabalho de campo para o projeto, se requerido.

Operador de Computador

Digite o nome do operador de computador para o projeto, se requerido.

Data

As configurações padrões ativam este campo para gravar a data de criação do projeto. Isto é feito automaticamente usando o código de campo da data neste campo em um projeto modelo.

Datum Vertical

Digite o nome do datum vertical.

Equipamento

Digite o(s) número(s) de série de seu equipamento.

NOTA: Quando um modelo é aberto, quaisquer definições de código de campo não são expandidas. Você pode usar este recurso para digitar definições de código de campo adequadas em seus modelos. Quando um projeto é aberto pela primeira vez, as definições de código de campo são expandidas.


Diálogo de Propriedades do Projeto - guia Sistema de Coordenadas

 Perspectiva geral e Mais informações

Use esta guia para selecionar e visualizar o sistema de coordenadas para o projeto.

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Selecione a guia sistema de coordenadas.

Configurações do Sistema de Coordenadas

Este grupo mostra um resumo do sistema de coordenadas atual. Ele mostra o local, sistema, zona, datum, e modelo geóide do projeto.

O botão Mudar abre o Diálogo selecionar sistema de coordenadas. Este diálogo é a primeira página de um wizard que você usa para selecionar um sistema de coordenadas.

NOTA: Para criar e editar sistemas de coordenadas, use a utilidade Trimble Coordinate System Manager.

Configurações de Local

Este grupo mostra um resumo da localização do local. Ele mostra a latitude, longitude, e altura do projeto, e o método de apresentação de coordenadas.

O botão Mudar abre o diálogo de Configuração do Local. Neste diálogo você pode mudar a localização do projeto e especificar se você quer usar coordenadas de solo.

Detalhes

O botão Detalhes abre o diálogo de detalhes do sistema de coordenadas. Use este diálogo para visualizar todos os parâmetros para a projeção do sistema de coordenadas atual, transformação de datum, ajuste, modelo geóide, e local.

Se você executar uma calibração de local GPS no projeto então os detalhes do sistema de coordenadas são uma combinação do sistema de coordenadas sublinhado e dos parâmetros de calibração de local GPS (ajuste horizontal e ajuste vertical).

Se você executar um ajuste de rede os parâmetros são usados como o ajuste.

Um sistema de coordenadas pode ter tanto parâmetros de calibração de local como de transformação de ajuste de redes, mas não ambos.

Salve como Local

O botão Salvar como Local abre o diálogo Salvar como Local.. Use este diálogo para salvar os detalhes do sistema de coordenadas (incluindo qualquer calibração de local GPS atual) no banco de dados do sistema de coordenadas como uma definição de local.

Uma vez que você tenha nomeado a definição do local, você pode usá-la como a definição do sistema de coordenadas para projetos futuros. Para editar o local, use a utilidade Trimble Coordinate System Manager.

NOTA: Parâmetros de Ajuste de Rede não são salvados em um Local.


Diálogo de Detalhes do Sistema de Coordenadas - guia Projeção

Para acessar esta guia:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Na guia Sistema de coordenadas, clique em Detalhes. O diálogo de detalhes do sistema de coordenadas aparece.

3.	Selecione a guia Projeção.

Para visualizar os parâmetros da projeção, use esta guia. Ele mostra o tipo de projeção (por exemplo, Transversa de Mercator ou Lambert). Os campos que são exibidos dependem da projeção.

O campo Azimute Sul refere-se à referência de azimute. A maioria dos países usa o Norte como o azimute de referência (Norte = 0°). No entanto, alguns lugares como África do Sul e Havaí, usam o Sul como o azimute de referência (Sul = 0°). Esta caixa é selecionada quando se está trabalhando em uma região que usa este método quando você estabeleceu os parâmetros da projeção no assistente do sistema de coordenadas ou definiu sistema de coordenadas de azimute sul na utilidade Trimble Coordinate System Manager™.

As opções Norte ou Sul e Leste ou Oeste positivos referem-se à direção na qual as coordenadas aumentam.


Diálogo de Detalhes de Sistema de Coordenadas - guia Transformação de Datum

Veja também
Para acessar esta guia:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Na guia Sistema de Coordenadas, clique em Detalhes. O diálogo de detalhes do sistema de coordenadas aparece.

3.	Selecione a guia Transformação de Datum.

Para visualizar os parâmetros de transformação de datum, use esta guia. Ele mostra o método de transformação e os parâmetros usados para transformar do elipsóide WGS-84 para o elipsóide local. Os parâmetros do elipsóide local são mostrados no grupo elipsóide Local.

As opções de transformação de datum que estão disponíveis são:

  Molodensky (Três parâmetros)

  Sete parâmetros

  Regressão múltipla

  Grid de datum

A tabela a seguir mostra os campos que estão disponíveis para cada opção:


Diálogo de Detalhes do Sistema de Coordenadas - guia Ajuste

Para acessar esta guia:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Clique a guia Sistema de Coordenadas, clique Detalhes. O diálogo de detalhes do sistema de coordenadas aparece.

3.	Selecione a guia de Ajuste.

Para visualizar os parâmetros de ajuste, use esta guia. O ajuste está na forma de uma calibração de local ou parâmetros de transformação de ajuste de rede aplicados a dados de levantamento desde:

  uma calibração e local GPS computada

  uma calibração importada desde um arquivo Survey Controller (*.dc)

  uma definição de local

  um ajuste de Rede (se você tiver o módulo de Ajuste de Rede instalado)

NOTA: Os campos Declive norte e Declive Leste no grupo de Ajuste Vertical de Calibração são exibidos em partes por milhão (ppm).


Diálogo de Detalhes do Sistema de Coordenadas - guia Modelo Geóide

Para acessar esta guia:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Na guia sistema de coordenadas, clique em Detalhes. O diálogo de detalhes do sistema de coordenadas aparece.

3.	Selecione a guia Modelo Geóide.

Para visualizar os detalhes do modelo geóide, use esta guia. Ele mostra o arquivo de nome e definição para qualquer modelo geóide que seja usado para determinar elevações para posições GPS.

NOTA: Para visualizar a qualidade do modelo geóide, use Propriedades do projeto / Guia recomputação.


Diálogo de Detalhes do Sistema de Coordenadas - guia Local

Use esta guia para visualizar detalhes do local.

Para acessá-la:

1.	Selecione arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Na guia Sistema de Coordenadas, clique em Detalhes. O diálogo de detalhes do sistema de coordenadas aparece.

3.	Selecione a guia Local.

A guia mostra:

  a latitude, longitude, e altura da localização do projeto

  o fator de escada de solo, offset de norte falso, offset de leste falso, e se coordenadas de solo estão ou não sendo usadas


Diálogo de Configurações de Local

Use o diálogo de Configuração de Local para editar a localização do projeto, e especificar se coordenadas de solo são usadas no projeto. Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. O diálogo de propriedades do projeto aparece.

2.	Selecione a guia Sistema de Coordenadas.

3.	Desde o grupo de configurações do Local, Clique em Mudar.

Localização do Projeto

Use este grupo para definir a localização do projeto, usando um ponto no centro do projeto. A localização do projeto pode ser definida em coordenadas de grid, locais, ou WGS-84.

NOTA: Você pode digitar as coordenadas de grid selecionando a localização na janela de gráficos.

Você precisa definir a localização do projeto no início do projeto, porque o software usa a informação em seus cálculos. Ele usa:

  a latitude do projeto para calcular o raio da terra

  a latitude e longitude do projeto para definir o fator de escala de grid

  a altura do projeto como a elevação padrão e para calcular o fator de elevação.

Se o sistema de coordenadas é indefinido então o diálogo de Definição da Projeção Padrão aparece. Digite uma latitude e longitude de origem antes de selecionar a opção Usar coordenadas de solo.

Use coordenadas de solo

Selecione esta caixa de verificação se você quiser usar coordenadas de solo em seu projeto. No entanto, assegure-se de definir o sistema de coordenadas do projeto e localização antes.

Quando esta caixa de verificação é selecionada, todos os itens no grupo Usar coordenadas de solo tornam-se disponíveis. O fator de escala de Computar da caixa de verificação da localização do projeto é desmarcada na primeira vez que você usar o diálogo configuração do local.

NOTA: O software apenas pode calcular o fator de escala de solo se os campos norte, leste, e elevação forem digitados no grupo de localização do Projeto.

NOTA: Se você executar uma calibração de Local GPS e então selecionar a caixa de verificação Usar Coordenadas de Solo, a calibração definida no projeto torna-se inválida. A mensagem adverte você de que continuar com a operação irá remover a calibração.

Apresentação da Coordenada de Solo

A opção de apresentação da coordenada de Solo permite que você mude a maneira como coordenadas de solo são exibidas em um projeto Trimble Geomatics Office. Esta mudança tornará mais fácil distinguir entre coordenadas de projeção e coordenadas de solo. Selecione um dentre os seguintes:

  Offset norte/Offset leste - adiciona um offset as coordenadas que são exibidas

  coordenadas de 4 dígitos - exibe 4 dígitos na apresentação de coordenadas de solo. Por exemplo, se a coordenada do projeto for 264150.000, a coordenada de solo é exibida como 4 510.000.

  coordenadas de 5 dígitos - exibe 5 dígitos na apresentação das coordenadas de solo. Por exemplo, se a coordenada do projeto for 264150.000, a coordenada de solo é exibida como 64 510.000.


Diálogo Salvar como Local

Use este diálogo para salvar o sistema de coordenadas atual como um local.

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. O diálogo Propriedades do projeto aparece.

2.	Clique em Salvar como Local.

Nome do Site

Digite o nome para a definição do local salvado.

OK

Clique em OK para salvar o local. O local é salvado no banco de dados do sistema de coordenadas. Qualquer local que você salvar aparece na guia Locais na utilidade Trimble Coordinate System Manager™. Você pode usar a definição de local como definição do sistema de coordenadas para projetos futuros.

SUGESTÃO: Quando estiver usando a utilidade Coordinate System Manager, clique na guia Locais. O Local aparece em azul.

NOTA: Você não pode salvar parâmetros de transformações de ajuste como um local.


Diálogo de Propriedades do Projeto - Guia Unidades e Formato

Use esta guia para estabelecer os valores de unidade usados em todo o Trimble Geomatics Office (como na apresentação da tela, importando, exportando, e relatando).

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. O diálogo Propriedades do projeto abre-se.

2.	Selecione a guia unidades e formato.

Coordenada

Configura as unidades de apresentação para valores de coordenada (Norte e Leste). Opções são Pés internacionais, Ligações, Metros, Pés de levantamento americano, ou metro namibianos.

Elevação/Altura

Estabelece as unidades de apresentação para elevações. Opções são Pés internacionais, Ligações, Metros, Pés de levantamento americano ou metros namibianos.

Casas decimais da coordenada

Estabelece o número de casas decimais a exibir para coordenadas. Você pode especificar até cinco casas decimais.

Ordem de Coordenada

Estabelece a ordem de coordenadas. Opções são Norte antes ou Leste antes.

Exibir posição do cursor como

Estabelece a apresentação da posição do cursor na barra de status. Opções são Grid, Lat long locais e Lat long WGS.

Distância

Estabelece a apresentação de distâncias. Opções são Correntes, Pés internacionais, Milhas internacionais, quilômetros, Ligações, Metros, Pés de Levantamento americano ou metros namibianos.

Casas decimais da distância

Estabelece o número de casas decimais a exibir para distâncias. Você pode especificar até cinco casas decimais.

Exibir distância como

Estabelece o tipo de distâncias a serem exibidas. As opções são:

  Distâncias elipsóides (distâncias de nível do mar)

Esta é a distância entre dois pontos de banco de dados computados na superfície da elipsóide de referências (a altura zero).

  Grid

Esta é a distância Pythagorean entre as coordenadas da projeção dos pontos das duas extremidades. Isto é, nenhum ajuste de projeção é aplicado significando que o fator de escala da projeção para a linha não é aplicável a ele.

  Solo.

Esta é a distância paralela à elipsóide que é computada na altura média sobre a elipsóide. Isto é, a distância elipsoidal computada matematicamente ajustada para a altura média dos pontos das extremidades. Se coordenadas de solo forem usadas, a distância de grid deve igualar-se à distância de solo. Isso é descrito como:

Onde

H	representa a altura do banco de dados

R	representa o raio da terra

DE	representa a distância elipsoidal

Área

Estabelece as unidades exibidas para áreas. Opções são Acres, Hectares, Pés quadrados, e Metros quadrados.

Casas decimais da área

Estabelece o número de casas decimais a exibir para áreas. Você pode especificar até cinco casas decimais.

Unidades de Ângulo

Estabelece as unidades de ângulo usadas para todas as direções horizontais e azimutes. Opções são Graus, Grads e Mils.

Formato de Ângulo (graus)

Estabelece o formato de ângulos ou azimutes quando em graus. As opções são:

  DDD.dddd	Graus decimais

  DDDMM'SS	Graus, minutos, e segundos

  DDDMM'SS.s	Graus, minutos, e segundos decimais

  DDDMM.mm	Graus e minutos decimais

Formato de Ângulos (grads / mils)

Estabelece o formato de ângulos ou azimutes quando em grads ou mils. As opções são três, quatro, ou cinco casas decimais.

Formato de Azimute

Estabelece o formato de valores de azimute. As opções são:

  Orientação do quadrante (apresentada na forma N6207'40"W)

  Círculo inteiro (apresentado na forma 29752'20")

Exibe WGS-84 como

Estabelece a Apresentação WGS-84 como opção para L,L,A ou X,Y,Z. A configuração aqui determina como as coordenadas WGS-84 são exibidas para pontos na janela de Propriedades, quando você inserir um ponto ou editar coordenadas para um ponto usando a utilidade Trimble Coordinate System Manager™. Esta configuração é também usada se você criar um formato de  importação, relatório, ou exportação personalizados como os valores WGS-84.

Formato lat, long

Estabelece o formato dos valores de Latitude e Longitude. As opções são:

  DDD.ddddddddd	Graus decimais

  DDDMM'SS.sssss	Segundos decimais

  DDDMM.mmmmmmm	Minutos decimais

Formato de Escala

Estabelece a apresentação e interpretação de valores de escala. As opções são:

  1 in to X ft	Unidades de medição Imperiais

  1:X	Unidades de medição métricas

Separador de Apresentação de milhares

Estabelece a apresentação do separador de milhares.

As opções são Sim ou Não. Se você selecionar Sim, o separador de milhares aparece conforme o que estiver configurado em seu sistema Microsoft Windows para ser aplicado a valores numéricos. Para mais informações, refira-se às Configurações Regionais no Microsoft Windows Control Panel.

NOTA: Quando esta configuração de apresentação estiver configurada para Sim, é esperado que o separador de milhares esteja presente nos arquivos ASCII importados e seja usado em arquivos ASCII exportados e relatórios. Isto pode fazer importações de arquivos falharem e resultar em arquivos exportados que não estão de acordo com o formato esperado (considere, por exemplo, um arquivo delimitado por vírgula com valores numéricos que usam vírgulas como separadores de milhares). O código de campo modificador ‘padrão’ pode ser usado em definições de formato para forçar tratamentos de valores numéricos a suprimir separadores de milhares e sempre esperar que o ponto decimal seja um ponto.

Unidades de Apresentação

Determina se as unidades de coordenadas são exibidas na janela de Propriedades e barra de status. A configuração padrão é sim.

Exibe nulos como

Estabelece a apresentação para valores nulos.

Iniciar nome do ponto automático desde

Estabelece o nome de numeração do ponto automático. Este valor é usado quando coordenadas são adicionadas ou criadas pelo software. O nome do ponto é automaticamente incrementado.

Formato do grau

Estabelece o formato de grade. Ele é usado e mostrado no software Trimble RoadLink™. As opções são Percentagem ou Índice.

Formato do Grau do Declive Lateral

Isto é usado e mostrado no software Trimble RoadLink. As opções são Percentagem ou Índice.

Unidades de Índice

Estabelece a ordem do formato de índice que é usado e mostrado no software Trimble RoadLink. As opções são Subida para Descida ou Descida para Subida. Por exemplo, Subida para Descida aparece como 1:100. Descida para subida aparece como 100:1.

Formato de Estação

Estabelece o formato para a apresentação de valores de estação em todo o software Trimble RoadLink. As opções de formato são:

  1000.0

  10+00.0

  1+000.0

  1/000.0

Unidades de Volume

Estabelece as unidades de volume que são usadas e mostradas no software Trimble RoadLink. As opções são metros cúbicos, pés cúbicos, ou jardas cúbicas.

Tipo de Visualização da Hora GPS

Determina o formato de visualização da hora. As opções são Hora local, Hora GPS e hora UTC.


Diálogo de Propriedades do Projeto - guia Relatório

Use esta guia para estabelecer as configurações do Relatório para o projeto.

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. O diálogo Propriedades do projeto abre-se.

2.	Selecione a guia Relatório.

Visualizar relatórios gerados

A opção Visualizar relatório gerado controla a apresentação de quaisquer relatórios gerados por operações como importação de dados, recomputação e processamento de código de característica. Relatórios são sempre criados para estas operações e armazenados em uma pasta apropriada na pasta de Relatórios para o projeto.

Estas opções controlam a apresentação de relatórios seguindo uma operação de processamento:

Sempre	Um relatório de qualquer processamento realizado é sempre exibido – se não houve erros ou avisos emitidos durante o processamento então o relatório consiste apenas de um cabeçalho mais qualquer informação em relação à operação de processamento realizada.
No erro	Se um erro tiver ocorrido durante qualquer processamento então o relatório neste processamento, que inclui detalhes do(s) erro(s) encontrado(s), é automaticamente apresentado.
Prompt no erro	Se um erro tiver ocorrido durante qualquer processamento então um aviso é apresentado para indicar que um erro ocorreu e você pode ter o relatório detalhando o(s) erro(s) apresentado.
Nunca	Você não é avisado de que um erro ocorreu durante qualquer processamento e que o relatório fornecendo detalhes não é apresentado.
Avisar sempre	Lhe será avisado para ver um relatório em todo processamento efetuado.


Diálogo de Propriedades do Projeto - guia Recomputar

Use esta guia para estabelecer as configurações de recomputar para o projeto.

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. O diálogo Propriedades do projeto aparece.

2.	Selecione a guia Recomputação.

Observações Laterais Múltiplas

Use este grupo para especificar como uma recomputação determina a posição para pontos laterais observados múltiplas vezes. Um ponto lateral não tem:

  observações fluindo deles

  coordenadas de controle

  Observações Estáticas ou FastStatics fluindo para eles

Use a melhor observação

Selecione esta opção se você não quiser que a recomputação faça a média das observações a pontos laterais. A melhor observação para o ponto será usada para determinar sua posição. Esta opção é selecionada por padrão.

Calcular média do mesmo tipo de observações (GPS, Convencional, Reduzida, Laser)

Selecione esta opção se você quiser que a recomputação faça a média das coordenadas derivadas para cada observação do mesmo tipo. A recomputação nunca faz a média das coordenadas derivadas de tipos diferentes de observação. Por exemplo, nunca será calculada a média das coordenadas determinadas desde uma observação convencional com aquelas determinadas por uma Observação GPS. A média é feita somente com pontos laterais.


Verificação de tolerância

Selecione estas caixas de verificação para usar caixas de verificação de tolerância durante o processo de recomputação. Uma recomputação usa os valores de tolerância para determinar as coordenadas médias quando a média Calculada da opção do mesmo tipo de observações é selecionada.

Você pode estabelecer tolerâncias para o Levantamento, Mapeamento, e posições de qualidade Desconhecida.

Os valores são usados para determinar quando um erro de fechamento é exibido para um ponto que tem coordenadas ou observações múltiplas. Se as coordenadas derivadas de todas as observações e coordenadas estiverem fora da tolerância, um erro de fechamento é relatado e um sinalizador de aviso aparece no ponto. Um erro de fora-da-tolerância é exibido na janela de Propriedades / página de Aviso.

Horizontal

Digita o valor de tolerância para o componente horizontal para uma posição.

Vertical

Digita o valor de tolerância para o componente vertical para uma posição.

Reduz observações terrestres para elipsóide (correção de Nível do Mar)

Selecione esta caixa de verificação se você quiser distâncias convencionalmente observadas corrigidas para a elipsóide durante a recomputação.

Correções de nível do mar devem ser aplicadas, a menos que você saiba que as medidas de distância de campo armazenadas no banco de dados já tenha tido esta correção aplicada ou as coordenadas inseridas são de solo e não coordenadas de grid. Se esta correção não é aplicada e os dados convencionais foram coletados desde uma altura significativa sobre o nível do mar então as coordenadas computadas não serão corretas.

Esta correção não se aplica a dados GPS, já que estes dados são sempre coletados em termos da elipsóide WGS-84.

NOTA: Se você estiver combinando medições GPS e terrestres, as observações para o elipsóide devem ser reduzidas.

NOTA: Você pode usar a distância da Apresentação como opção na guia Unidades e formato para controlar como distâncias entre pontos do banco de dados são relatadas. Quando você estabelece esta opção para distâncias de Solo isto permite que você visualize qual é efetivamente o componente horizontal de qualquer distância de solo medida.

Para mais informações, veja o tópico Correção de Nível do Mar.

Qualidade do Modelo Geóide

Selecione a qualidade para o modelo geóide usada para o projeto. Se ela estiver na ordem de 5 m de precisão, selecione Mapeamento. Se você sabe que o modelo geóide é de precisão de levantamento, selecione a opção Levantamento. Recomputar usa esta qualidade para determinar a qualidade das elevações (para um ponto GPS) ou altura (para pontos terrestres) derivada do modelo geóide. Este campo não está disponível se não houver geóide usado no sistema de coordenadas do projeto.


Diálogo de Propriedades do Projeto - guia Características

Use esta guia para especificar a característica e atribuir configurações para o projeto.

Para acessá-lo:

1.	Selecione arquivo / Propriedades do projeto. O diálogo Propriedades do projeto aparece.

2.	Selecione a guia características.

Código de característica na importação

Selecione o código de característica na caixa de verificação de importação para automaticamente processar códigos de características quando um arquivo de dispositivo é importado. Selecione a característica e biblioteca de atributos que você quer usar para processar os códigos de característica automaticamente.

NOTA: Se você selecionar esta opção você ainda pode processar códigos de característica mais tarde usando o menu Ferramentas na visualização do Plano, e selecionar qualquer biblioteca de característica e atributo para usar. (Você não tem que usar a biblioteca que você selecionou aqui.)

Biblioteca

Digite o nome da biblioteca de característica e atributo que você quiser usar ou clique em Procurar e localize-a. Este campo não está disponível a menos que você selecione a caixa de verificação de códigos de Característica.

Usar atributos

Para configurar o projeto/modelo para atributos, selecione a caixa de verificação de Atributos.

Este campo apenas refere-se a biblioteca usada para definições de atributos.

Biblioteca

Para selecionar a biblioteca, digite o caminho e o nome no campo Biblioteca, ou clique em Procurar.

Procurar

Clique em Procurar e localize o arquivo de Dicionário de Dados requerido (*.ddf) ou arquivo de Biblioteca de Característica e Atributo (*.fcl). A pasta padrão é a pasta do sistema Trimble Geomatics Office.

Se você não tem nenhum ponto no banco de dados que contenha características, você pode mudar a biblioteca de característica e atributo associada ao projeto.

No entanto, uma vez que você tenha importado um arquivo Survey Controller (*.dc) contendo atributos, ou adicionado atributos usando a janela de Propriedades, você não pode mudar a biblioteca de característica e atributo usada para configurar o projeto para atributos. Isso assegura-o de que os dados de atributos no projeto são consistentes


Arquivos do Trimble Geomatics Office - Perspectiva geral

O Trimble Geomatics Office que é instalado no seu computador inclui diversos arquivos que armazenam diversas configurações sobre o sistema e cada projeto.

AVISO: Não edite estes arquivos a menos que seja necessário. Você pode introduzir erros e o Trimble Geomatics Office pode não funcionar como esperado. Se você quiser editar estes arquivos, faça uma cópia de segurança antes.

Estes arquivos estão divididos nas seguintes seções:

Arquivos Trimble

Estes estão localizados no Arquivos de Programas\Arquivos comuns\pasta Trimble:

  Current.csd.

  Antenna.ini

  Receiver.ini

Arquivos do Sistema Trimble Geomatics Office

Estes estão localizados em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema:

  Asciiexp.dat

 arquivo Asciiimp.dat

  Asciirpt.dat

  arquivos Html

  Symbols.sym

  Linetype.ltp

  Default.fcl

  arquivos Frm

Arquivos de Projeto

Estes estão localizados em cada diretório raiz de projetos (normalmente C:\Trimble Geomatics Office\Projects\<nome do projeto>:

  Options.ini

  TGO_v160.mdb

  TGO_v160.dbs


Arquivo Options.ini

Veja também

Um arquivo Options.ini é associado com cada projeto. Ele é localizado na pasta com o nome do projeto. Este arquivo fornece controle sobre os dados mostrados na Janela de propriedades, sumário do ponto, e cabeçalhos de relatório.

O arquivo Options.ini é separado em três seções:

  [Sumário]

  [Relatório]

  [Etiquetas]

Configurando a Definição do Sumário

A Definição do sumário no arquivo Options.ini permite que você especifique os detalhes do ponto mostrados na barra de status conforme os pontos são selecionados, da mesma forma que o ToolTip que mostra quando você posiciona o ponteiro do mouse sobre um ponto. Por padrão é configurado para  [Nome] : [Código da característica] de forma que você consiga pontos resumidos com ambos seus nomes e códigos de característica.

Se você preferir que os pontos sejam resumidos com seus nome e estilo de ponto separados por um '/' defina a seção [Sumário] do arquivo Options.ini como:

Ponto=[Nome]/[Estilo do Ponto]

Você também pode designar sumários específicos para entidades de Linha, Arco, Curva, e Texto. Por exemplo se você quiser que o Azimute e a Distância sejam relatados como resumo para uma linha, adicione a seguinte definição à seção [Sumário]:

Linha=Az: [Azimute] Dist: [Distância]

Você pode incluir texto junto com códigos de campo na especificação do sumário.

Por padrão o sumário para linhas, arcos, e curvas é o sumário do ponto para os pontos iniciais e finais separados por uma vírgula.

Configurando o cabeçalho do Relatório

A seção [Relatório] lhe permite especificar um cabeçalho de relatório padrão que pode ser incluído em todos os relatórios produzidos usando um código de campo único chamado [$Report.Heading]. O cabeçalho do relatório pode consistir de uma mistura de texto e códigos de campo. Use ‘\n’ para indicar onde uma linha nova deve começar. Isto permite que você separe o cabeçalho sobre um número de linhas. Por exemplo você pode incluir o nome de sua empresa no cabeçalho padrão do relatório.

Configurando as Opções de Etiquetas

A seção [Etiquetas] permite que você adicione opções de etiquetas nova que aparecem no Diálogo de etiquetas.

Você pode usar uma mistura de códigos de campo e texto para definir a definição de etiqueta. Use o caracter ‘|’ para separar cada opção de etiqueta e novamente para separar o nome da opção de etiqueta e qual texto é na verdade exibido como a etiqueta. Por exemplo, diretamente após a última das opções de etiqueta, digite o seguinte usando o teclado:

|Descrição|[descrição]

Isto irá adicionar uma opção nova de etiqueta no diálogo de etiquetas chamada ‘Descrição’. Quando selecionada, cada ponto sendo etiquetado terá seu valor do campo descrição exibido.

NOTA: Você não pode definir opções de etiqueta para linhas, curvas, ou arcos.


Arquivo TGO v160.mdb

 Veja também

AVISO: Trimble Navigation Limited suporta o uso e modificação deste banco de dados somente através do uso do software Trimble Geomatics Office de propriedade da Trimble. A Trimble não suporta ou autoriza o uso ou modificação, ou garante o desempenho, deste banco de dados por meio de outras aplicativos de software. A Trimble pode, a qualquer tempo, modificar o formato deste banco de dados tornando-o incompatível com outros aplicativos de software.

Cada projeto tem um arquivo de banco de dados do Microsoft Access (*.mdb) nomeado TGO_v160.mdb. Ele está localizado na pasta do projeto. Este arquivo contém todos os dados do projeto, incluindo tabelas e consultas. Se você possuir o Microsoft Access (Access 2000 ou posterior) você pode:

  visualizar os dados do projeto

  criar seus próprias avisos


Arquivo TGO_v160.dbs

Na primeira vez que você fechar um projeto Trimble Geomatics Office novo, um arquivo de esquema de banco de dados (*.dbs) será criado. Ele é baseado no arquivo de banco de dados do Microsoft Access Database (*.mdb).

Ambos o arquivo .dbs e o arquivo .mdb estão localizados na pasta raiz do projeto.

Se você adicionar consultas personalizadas ao banco de dados você necessita apagar este arquivo .dbs após criar as consultas.

Um arquivo .dbs novo (contendo as consultas novas) é criado quando na próxima vez eu você abrir o projeto e as consultas tornarem-se disponíveis para uso.


Arquivo Antenna.ini

Este arquivo especifica as antenas GPS disponíveis no Trimble Geomatics Office. Ele é usado por outro software Trimble da mesma forma que este software.


Arquivo Receptor.ini

Este arquivo contém uma lista dos receptores disponíveis. Você não deve editar este arquivo.


Arquivo Asciiexp.dat

Este arquivo é localizado em  Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema.

Ele contém todos os formatos de exportação ASCII  e Personalizado para o Trimble Geomatics Office. Este arquivo é lido cada vez que você acessar o diálogo Exportar.

Para acessar este diálogo, faça um dentre os seguintes:

  Selecione a ferramenta Exportação [image].

  Selecione arquivo / Exportar.

Os símbolos seguintes indicam em qual guia o formato aparece. Apenas definições ASCII são incluídas neste arquivo:

Símbolo	Guia
=	Levantamento
+	CAD/ASCII
*	GIS
Nenhum	Personalizado

Você apenas pode editar os formatos disponíveis na guia Personalizado. Portanto, se você quiser editar o formato de um dos formatos disponíveis na guia CAD/ASCII, remova o sinal de mais (+)  do início da definição de formato.

Por exemplo, a linha a seguir é incluída no arquivo Asciiexp.dat:

Coordenadas +SDRmap

Para fazer deste um formato que você possa editar, remova o sinal de mais (+).

Na próxima vez que você acessar o diálogo Exportar, o formato aparece na guia Personalizado e o botão Editar torna-se disponível.

Da mesma forma, você pode fazer um formato personalizado em um formato que você não pode editar inserindo um dos símbolos acima no início do nome do formato.

Por exemplo a linha a seguir é incluída no arquivo Asciiexp.dat:

Pontos Delimitados

Mude esta linha para:

+Pontos Delimitados

Da próxima vez que você acessar o diálogo Exportar, o formato aparece na guia CAD/ASCII e o botão Editar não é disponível.


Arquivo Asciiimp.dat

Este arquivo é localizado em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema. Ele contém todos os formatos de importação ASCII e Personalizado para o Trimble Geomatics Office.

Este arquivo é lido cada vez que você acessar o diálogo Importar.

Para acessar este diálogo, faça um dentre os seguintes:

  Selecione a ferramenta Importação [image].

  Selecione arquivo / Importar.

Os símbolos seguintes indicam em qual guia o formato aparece. Apenas definições ASCII são incluídas neste arquivo:

Símbolo	Guia
=	Levantamento
+	CAD / ASCII
Nenhum	Personalizado

Você apenas pode editar os formatos de importação disponíveis na guia Personalizado. Portanto, se você quiser editar o formato de um dos formatos disponíveis na guia CAD/ASCII, remova o sinal de mais (+)  do início da definição de formato.

Por exemplo, a linha seguinte é incluída no arquivo Asciiimp.dat:

Formato +WILDsoft

Para fazer deste um formato que você possa editar, remova o sinal de mais (+).

Na próxima vez que você acessar o diálogo Importar, o formato aparece na guia Personalizado e o botão Editar torna-se disponível. Da mesma forma, você pode fazer um formato personalizado em um formato que você não pode editar inserindo um dos símbolos acima no início do nome do formato.

Por exemplo a linha a seguir é incluída no arquivo Asciiimp.dat:

Pontos Delimitados

Mude esta linha para:

+Pontos Delimitados

Da próxima vez que você acessar o diálogo Importar, o formato aparece na guia CAD/ASCII e o botão Editar não é disponível.


Arquivo Asciirpt.dat

Este arquivo é localizado em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema. Ele contém todos os formatos de relatório de Banco de dados para o Trimble Geomatics Office. Este arquivo é lido cada vez que você acessar o diálogo Relatórios adicionais.

Para acessar o diálogo de Relatórios Adicionais, selecione Relatórios / Relatórios Adicionais.

Você pode fazer com que qualquer formato de banco de dados do sistema do diálogo de Relatórios Adicionais seja um formato que você possa editar removendo o sinal de igual (=) de nome do formato no arquivo.

Por exemplo, a linha a seguir é incluída no arquivo Asciirpt.dat:

=Pontos

Para fazer deste um formato que você possa editar, remova o sinal de igual (=).

O formato agora vai aparecer no diálogo Relatórios adicionais onde ele pode ser editado. Da mesma forma, você pode fazer um formato personalizado do diálogo de Relatórios adicionais em um formato que não pode ser editado inserindo um sinal de igual (=) no início do nome do formato.

Por exemplo, a linha a seguir é incluída no arquivo Asciirpt.dat:

Lista de ponto de largura fixa

Mude esta linha para:

= lista de ponto de largura fixa

O formato aparece agora no diálogo de Relatórios Adicionais e não pode ser editado.


Arquivos .html

Vários arquivos de Linguagem Hypertext Markup (.html) modelos são instalados em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema. Estes modelos são usados para criar relatórios de sistema. Você não deve apagar estes arquivos.

Relatórios (por exemplo, Recomputar.html) gerados pelo Trimble Geomatics Office são armazenados na pasta de Relatórios do projeto apropriada. Para abrir um relatório .html, clique duas vezes no relatório no Microsoft Windows Explorer. Ele abre o visualizador HTML padrão.

NOTA: Você pode modificar estes arquivos .html para personalizar a informação que aparece nos relatórios de sistema. No entanto, a Trimble não apoia ou garante que arquivos .html modificados irão operar como esperado. A Trimble recomenda que você faça uma cópia de segurança de qualquer arquivo .file antes de alterá-lo.


Arquivo Symbols.sym

O arquivo Symbols.sym está localizado em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema.

Use a utilidade Trimble Symbol Editor™ para visualizar e editar este arquivo. O arquivo contém símbolos. No Trimble Geomatics Office, ou na utilidade Trimble Feature and Attribute Editor™, você pode criar estilos novos de pontos usando os símbolos disponíveis neste arquivo.

Você também pode criar seus próprios arquivos .sym. Para mais informações sobre como usar arquivos .sym, veja o capítulo Utilidades no Guia do Usuário do software Trimble Geomatics Office.


Arquivo Linetype.ltp

O arquivo Linetype.ltp) file está localizado em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema. Use a utilidade Trimble Line Type Editor™ para visualizar e editar este arquivo.

O arquivo contém tipos de linhas. No Trimble Geomatics Office, ou na utilidade Trimble Feature and Attribute Editor™, você pode criar estilos novos de linhas usando os tipos de linhas disponíveis neste arquivo.

Você também pode criar seus próprios arquivos .ltp. Para mais informações sobre como usar arquivos .ltp, veja o capítulo Utilidades no Guia do Usuário do software Trimble Geomatics Office.


Arquivo Default.fcl

O arquivo Default.fcl está localizado em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema. Para visualizar e editar este arquivo, use a utilidade Trimble Feature and Attribute Editor™. Todos os arquivos .fcl são bibliotecas de características e atributos.

Este arquivo contém códigos de características pré-definidos (com e sem atributos), estilos de pontos, estilos de linhas, estilos de anotações, e códigos de controle.

Para usar este arquivo:

1.	Transfira-o para o Trimble Survey Controller para coletar informações sobre código de característica.

2.	Use o arquivo no Trimble Geomatics Office para processar os códigos de característica e para configurar o projeto para atributos se você estiver coletando informações sobre atributos.

Você pode criar sua própria biblioteca de característica e atributo usando a utilidade Trimble Feature and Attribute Editor™. Para informações sobre como criar bibliotecas de característica e atributo, veja a Ajuda do Trimble Feature and Attribute Editor.


Arquivo Current.csd

O arquivo Current.csd está localizado na pasta Arquivos do programa\Arquivos comuns\Trimble\Geodata.

Current.csd é o banco de dados do sistema de coordenadas para o Trimble Geomatics Office. Este arquivo é usado quando você seleciona um sistema de coordenadas para um projeto.

Para visualizar e editar este arquivo, use a utilidade Trimble Coordinate System Manager™. Para informações sobre como criar sistemas de coordenadas, veja a Ajuda da Trimble Coordinate System Manager.


Arquivos .frm

Plano de modelos são armazenados como arquivos .frm. Eles estão localizados em Arquivos de programas\Trimble\Trimble Geomatics Office\Pasta do sistema.

Quando você configura a configuração da folha para imprimir ou traçar, você tem que selecionar um formulário de plano para usar.

NOTA: Os arquivos .frm files são arquivos de texto. Para visualizá-los e editá-los, use o editor de textos.


Microsoft Access 97
Microsoft Access 2000

AVISO: A Trimble Navigation Limited suporta o uso ou modificação deste banco de dados somente pelo uso do software Trimble Geomatics Office de propriedade da Trimble. A Trimble não apoia ou autoriza o uso ou modificação, ou garante o desempenho, deste banco de dados através de outros aplicativos de software. A Trimble pode, a qualquer tempo, modificar o formato deste banco de dados tornando-o incompatível como outros aplicativos de software.

O Trimble Geomatics Office usa um banco de dados Microsoft Access 2000. Se você tiver uma versão anterior do software Microsoft Access software, você não pode abrir o arquivo <projeto>.mdb. Se você tiver um Microsoft Access 2000 (ou posterior) você pode usar este software para visualizar os dados de seu projeto e criar novas consultas.


Consultas de Bancos de Dados - Perspectiva geral

Mais informações

Como ...

AVISO: A Trimble Navigation Limited suporta o uso ou modificação deste banco de dados somente pelo uso do software Trimble Geomatics Office de propriedade da Trimble. A Trimble não suporta ou autoriza o uso ou modificação, ou garante o desempenho, deste banco de dados através de outros aplicativos de software. A Trimble pode, a qualquer tempo, modificar o formato deste banco de dados tornando-o incompatível como outros aplicativos de software.

Perspectiva geral

O Trimble Geomatics Office usa um banco de dados Microsoft Access 2000. Você pode usar o Microsoft Access para criar suas próprias consultas.

NOTA: A Trimble não aceita nenhuma consulta definida por usuário.

Os detalhes aqui fornecidos dão informações limitadas com respeito ao desenho de consultas para uso no Trimble Geomatics Office. Se você precisar rever estas técnicas, nós sugerimos que você consulte a documentação que vêm com o Microsoft Access.

Definindo consultas do Microsoft Access

Normalmente, as consultas que você quiser definir para usar em projetos podem ser pré-definidas nos modelos de projeto.

Você pode exportar definições de consulta para outros bancos de dados Microsoft Access. Portanto, se definições de consultas úteis tiverem sido criadas em um projeto em particular, você pode depois exportá-las para o(s) modelo(s) do projeto principal de forma a torná-las disponíveis em outros projetos Trimble Geomatics Office.

A chave para usar consultas do Microsoft Access dentro do Trimble Geomatics Office é que o(s) campo(s) ID especificados na consulta definem os tipos de entidade que devem ser selecionados pela consulta.

Duas condições relacionam-se ao uso de campos ID em uma consulta de seleção:

  A consulta deve ser definida com a primeira coluna de saída (selecione a caixa de verificação Mostrar para a coluna) sendo um campo ID ou uma tabela inteira (*opção usada).

  Se a consulta for ser designada para selecionar tipos de entidade múltiplos (por exemplo, selecionando todos os pontos associados com entidades de Arco), então os campos ID relacionados a cada uma das entidades a ser selecionada devem ser os únicos campos de saída na consulta.

Definindo consultas para o Trimble Geomatics Office

Se você quiser definir uma consulta a ser usada no Trimble Geomatics Office, você deve prefixar o nome da consulta corretamente de forma que a consulta aparece na lista requerida.

NOTA: Nas consultas de relatório e exportação, a tabela de dados estabelecidos na seleção devem ser mencionados no nome da consulta. Por exemplo, para exportar uma lista de pontos, a consulta deve ser chamada Export(Point)_Point List

Se você criar uma consulta para propósito de seleção e quiser que ela aparece na lista Selecionar / Por Consulta a consulta deve ter o prefixo Select_. Quaisquer consultas com um prefixo Select_ estarão também disponíveis quando relatórios personalizados estiverem sendo criados.

Se você quiser desenhar uma consulta somente para relatório, use o Relatório _prefixo(Tabela de dados do grupo de seleção). Consultas com um Relatório _ prefixo (Tabela de dados do grupo de seleção)_ não aparecerão na lista Selecionar / por Consulta.

Se você quiser adicionar uma consulta para filtrar itens na lista de seleção da Janela de propriedades, use o prefixo _SS. A consulta aparece na lista quando você clicar na ferramenta Filtro na Janela de propriedades.


Passando Parâmetros para Consultas no Microsoft Access

AVISO: A Trimble Navigation Limited suporta o uso ou modificação deste banco de dados somente pelo uso do software Trimble Geomatics Office de propriedade da Trimble. A Trimble não suporta ou autoriza o uso ou modificação, ou garante o desempenho, deste banco de dados através de outros aplicativos de software. A Trimble pode, a qualquer tempo, modificar o formato deste banco de dados tornando-o incompatível como outros aplicativos de software.

Para poder usar as mesmas consultas personalizadas para selecionar entidades diferentes em momentos diferentes é possível especificar parâmetros como parte da definição de software Microsoft Access.

Quando um parâmetro é especificado, o Trimble Geomatics Office permite que você digite o valor apropriado quando a consulta inicia. Um exemplo do uso de um parâmetro em uma consulta é o fornecimento de uma consulta para selecionar entidades de ponto por seu código de característica.

Por exemplo, você pode selecionar todos os pontos com o código de característica ‘Árvore’ em um determinado momento e então todos os pontos com o código de característica ‘Post’ em um momento posterior.

Um parâmetro pode ser especificado para uma coluna em uma definição de consulta, digitando entre colchetes (isto é, [] ) o prompt que você quer exibido junto com a condição de comparação a ser alcançada (isto é, =, >, <, Como), no campo Critério.

Por exemplo, no caso de uma consulta para selecionar pontos por código de característica, o campo código de Característica precisa ser adicionado à definição da consulta. O campo Critério precisa definir a condição a ser alcançada, por exemplo: ‘Como [Código]’.

Neste exemplo o operador de comparação seqüência Como é usado para verificar códigos que combinem.

Um refinamento a mais é possível na especificação de parâmetros de consulta. Isto permite que você preencha o campo de entrada de parâmetro do Trimble Geomatics Office clicando em entidades no modelo gráfico. Este refinamento é definido seguindo o prompt de parâmetro por dois pontos, e então o nome do campo do banco de dados sendo preenchido. No exemplo de código acima isto tornar-se-ia: Como [Código:código da Característica]

Além de definir a condição de parâmetro no campo de Critério, você deve também digitar a definição de parâmetro no diálogo para a consulta. O diálogo aparece no menu de atalho quando o ponteiro está na porção superior do diálogo de consulta.

NOTA: O campo Parâmetro deve conter exatamente o mesmo texto que o que foi digitado entre os colchetes do campo Critério.

O campo Tipo de Dados para cada parâmetro é estabelecido de acordo com o tipo de dados sendo digitado. No exemplo acima, como o código de característica é um campo do tipo texto isto é configurado para Texto. Se um parâmetro do tipo número real como a altura de um ponto está sendo especificado, então o campo Tipo de Dados deve ser configurado para Duplo.

Os detalhes fornecidos aqui dão informações limitadas com respeito ao desenho de consultas para uso no Trimble Geomatics Office. Se você precisar revisar estas técnicas, nós sugerimos que você consulte a documentação que vêm com o Microsoft Access.


Usando Consultas Personalizadas para Filtras um Grupo de Seleção

AVISO: A Trimble Navigation Limited suporta o uso ou modificação deste banco de dados somente pelo uso do software Trimble Geomatics Office de propriedade da Trimble. A Trimble não suporta ou autoriza o uso ou modificação, ou garante o desempenho, deste banco de dados através de outros aplicativos de software. A Trimble pode, a qualquer tempo, modificar o formato deste banco de dados tornando-o incompatível como outros aplicativos de software.

Usando o Microsoft Access, é possível gerar consultas mais complexas que funcionam com a tabela de Dados do grupo de seleção, e permite que a consulta da seleção efetivamente filtre o grupo de seleção do banco de dados.

A tabela de dados do grupo de seleção contém os IDs dos registros de todas as entidades que estão em qualquer grupo de seleção.

Para conseguir esta funcionalidade de filtro, a Tabela de dados do grupo de seleção deve ser incluída dentro da definição da consulta, junto com a tabela contendo as entidades a serem selecionadas (por exemplo, a tabela de Pontos). Neste caso o campo ID do registro na Tabela de dados do grupo de seleção deve ser juntado ao campo ID apropriado na outra tabela incluída na consulta. Este ligação dos campos nas duas tabelas pode ser feita arrastando e largando o nome do campo apropriado em uma tabela no nome do campo da outra tabela.

Como nas outras consultas de seleção discutidas acima, o primeiro campo mostrado na tabela deve ser um campo ID ou a tabela inteira. Para que a consulta selecione apenas entidades de uma tabela especifica, a consulta deve definir o nome da tabela contendo as entidades a serem selecionadas da tabela de dados do grupo de seleção. Isto significa que se pontos estiverem sendo selecionados, o campo Nome da Tabela da Tabela de dados do grupo de seleção deve ser adicionado à consulta, com o Critério configurado para ‘Ponto’.

A Tabela de dados do grupo de seleção contém os ID’s dos registros de todas as entidades que estão em qualquer grupo de seleção. A cada grupo de seleção é alocado um número de identificação único que é listado na coluna ID do Nome do Grupo de Seleção da Tabela de dados do grupo de seleção. O número 0 indica que a entidade é um membro do grupo de seleção atual, de forma que a consulta pode usar este valore para assegurar que apenas o grupo de seleção atual seja filtrado. Isto é feito adicionando mais uma coluna à consulta especificando a ID do Nome do Grupo de Seleção e estabelecendo o campo Critérios para 0. Configurando estes Critérios para outro valor permite que você faça uma seleção atual baseada em um grupo de seleção existente se você requerer.

Os detalhes fornecidos aqui dão informações limitadas a respeito do desenho de consultas para uso no Trimble Geomatics Office. Se você precisar rever estas técnicas, nós sugerimos que você consulte a documentação que vêm com o Microsoft Access.


Modelos de Projeto - Perspectiva geral

Mais informações

Como...	Diálogo
Perspectiva geral

Quando você cria um projeto novo você tem que selecionar um modelo. Um modelo contém todas as configurações, dados, e estruturas de arquivo. Informações no modelo são copiadas para o projeto quando você cria-o. Por exemplo, se você tem um arquivo Survey Controller (*.dc) na pasta de Verificação para o modelo, o projeto terá o mesmo arquivo .dc em sua pasta de Verificação. Quaisquer edições feitas no projeto não são feitas no modelo.

Modelos são úteis para:

  selecionar estilos CAD que você quiser usar

  adicionar pontos de controle ao banco de dados

  adicionar quaisquer arquivos consultados

  selecionar o sistema de coordenadas apropriado

  selecionar as unidades requeridas

  selecionar as configurações de ponto duplicados

A Trimble fornece inúmeros modelos com o Trimble Geomatics Office. Por exemplo, o modelo métrico permite que você use medições métricas em todos os projetos criados usando aquele modelo.

Modelos são armazenados em Arquivos de programas\Trimble\Trimble Geomatics Office\pasta Modelo.


Comando Relatório Re-computar

Use este comando para visualizar o relatório Re-computar. O relatório é criado da mais recente recomputação dos dados de levantamento.

Para acessá-lo, selecione Relatórios / Relatório Re-computar.

O relatório é exibido no seu visualizador padrão de HTML.


Relatórios do Sistema - Perspectiva geral

Ver também

Relatórios do sistema são gerados após uma operação de processamento ou computação dos dados de levantamento. Estes relatórios são criados na pasta Relatórios. Com a exceção do relatório Importar, quando um novo relatório é gerado, ele sobrescreve todos relatórios existentes com o mesmo nome na pasta.

Os seguintes relatórios são criados automaticamente pelo sistema após um operação de processamento:

  relatório Importar

  relatório Re-computar

  relatório Processamento de Código de Característica

  relatório Pasta do projeto

Para receber uma notificação sobre estes relatórios, selecione a opção Visualizar relatório gerado no diálogo Propriedades do projeto - guia Relatando.

Pode-se gerar os seguintes relatórios do sistema depois de ter executado uma operação de levantamento. Estes relatórios fornecem detalhes sobre as computações de levantamento ou mudanças nos dados de levantamento.

  Re-computar

  relatório da derivação do ponto

  relatório de processamento da linha de base GPS (se tiver instaldo o módulo de Processamento da Linha de Base WAVE)

  Relatório de Fechamentos de circuitos GPS

  Relatório Ajuste da Rede (se tiver instalado o módulo de Ajuste da Rede)

  relatório Calibração do Local GPS

  relatório Transformação de Coordenadas

  relatório Ajuste de elevação

  relatório Inverso

  relatório Renomear pontos

  relatório do nível

NOTA: A disponibilidade de alguns relatórios depende dos módulos instalados (Processamento da Linha de Base e Ajuste de Rede).


Relatórios do banco de dados - Perspectiva geral

Ver também

Relatórios do banco de dados são relatórios gerados do registros primários de tabela e perguntas definidas no banco de dados. Isto é, criam relatórios sobre informações do banco de dados do projeto.

Estes relatórios são úteis se desejar obter um resumo do projeto ou fornecer relatórios a clientes.

Relatórios de banco de dados pertencem a duas duas categorias:

  Relatórios do banco de dados do sistema

  Relatórios personalizados

Ambos relatórios são acessados a partir do diálogo Relatórios adicionais

Pode-se usar ou modificar um relatório existente do banco de dados fornecido pelo Trimble Geomatics Office, ou personalizar o próprio formato de relatório.


Relatórios - Perspectiva geral

O Trimble Geomatics Office gera todos relatórios no formato HyperText Markup Language (HTML) e exibe-os num visualizador de HTML instalado no computador. Normalmente o seu visualizador de HTML será um browser de rede da Internet.

Todos relatórios são criados na pasta de Relatórios do diretório Trimble Geomatics Office\Projetos. Os relatórios são organizados em pastas com o nome do tipo de relatório. Com a exceção do relatório Importar e do relatório de Ajuste da Rede, quando um novo relatório é gerado, ele sobrescreve todos relatórios existentes com o mesmo nome na pasta.

Dois tipos de relatórios podem ser gerados:

  Relatórios do sistema

  Relatórios do banco de dados

Comumente, relatórios usados podem ser acessados do menu de Relatórios. A disponibilidade de alguns relatórios do sistema depende dos módulos (Processamento de Linha da Base e Ajuste da Rede) instalados e se um relatório já foi gerado.

NOTA: Os relatórios do Trimble Geomatics Office não podem ser visualizados no Microsoft Internet Explorer versão 2 ou 3. Se tiver uma destas versões, a Trimble recomenda que instale o Microsoft Internet Explorer 4 ou 5 disponível na rede.


Browser da rede do Microsoft Internet Explorer - Visualizador de Relatórios

O browser da rede do Microsoft Internet Explorer é disponível na rede de Internet se você não possuir instalado um visualizador de HTML. O browser da rede Microsoft Internet Explorer lhe permite visualizar e imprimir o relatório criado. Pode-se usar as outras características úteis do Microsoft Internet Explorer para condizer com suas finalidades nos relatórios.

Personalizar a aparência do relatório

Os relatórios do Trimble Geomatics Office são exibidos num formato padronizado. As fontes, tamanhos de fonte, cores e fundos são os mesmos em todos relatórios. Pode-se forçar a mudança destas configurações com suas próprias preferências. Faça isso se quiser exibir um relatório num formato que seja mais fácil de ler.

SUGESTÃO: Para mudar o fundo do relatório, substitua o arquivo fundo.gif por outro arquivo de gráficos CompuServe Graphics Interchange (GIF) com o mesmo nome na pasta Relatórios.

Pode-se especificar as opções de impressão para evitar que o fundo do relatório seja impresso. Por padrão, esta opção é desativada.

Abra o relatório em outra aplicação de software

Muitas aplicações de software suportam documentos no formato HTML. Além disso, pode-se salvar o relatório como um arquivo de texto (*.txt) a ser aberto em outra aplicação, tal como um editor de texto, planilha ou processador de dados. Também pode-se copiar uma seleção do relatório na área de transferência e colá-lo em outra aplicação de software.

Estas características podem ser úteis se desejar inserir o relatório num documento, editar o conteúdo do relatório ou usar os dados para efetuar outas computações em outra aplicação.

Para informações sobre o uso de características do Microsoft Internet Explorer nos seus relatórios, consulte a Ajuda do Internet Explorer.


Diálogo Definir formato do relatório

Use este diálogo para definir um formato do relatório.

Para acessá-lo:

1.	Selecione Relatórios / Relatórios adicionais. Aparece o diálogo Relatórios adicionais.

2.	Escolha uma das seguintes opções:

  Clique Novo para definir um novo formato de relatório.

  Escolha um formato de relatório existente da lista de Relatórios e clique Editar para modificar o formato selecionado.

NOTA: Não pode-se editar relatórios de Pontos, Alcance da elevação, Detalhes do sistema de coordenadas ou Comparação do ponto.

Nome

Insira o nome do formato do relatório. Este nome aparece na lista de Relatórios do diálogo Relatórios Personalizados. Nomes duplicados não são permitidos.

Seqüência nula

A seqüência nula exibe a seqüência nula que foi especificada em Arquivo / Propriedades do projeto / guia Unidades e formato. A seqüência especificada neste campo é usada em campos do relatório personalizado gerado que possuem um valor nulo. Este campo é opcional.

Descrição

Pode-se inserir uma descrição do formato de relatório no campo Descrição. Esta descrição aparece na barra de status. Este campo é opcional.

Extensão padrão

A extensão padrão não é usada na definição de um formato de relatório.

Relatório sobre

Selecione uma das tabelas ou perguntas primárias como fonte do relatório. A fonte padrão é o registro de informações do Ponto. Isso lhe permite criar um relatório sobre qualquer registro na tabela do ponto.

Preencher formulário automaticamente

Clique Preencher formulário automaticamente para inicializar automaticamente o cabeçalho e o corpo. Para maiores informações, consulte Preencher formulário automaticamente.

Cabeçalho do formato

Insira o texto fixo e todas definições de código de campo (disponíveis no menu de atalho) que devem constituir o cabeçalho do relatório. Este campo é opcional e não necessita ter especificada uma definição.

Pressione Inserir para adicionar linhas em branco na definição do cabeçalho.

Corpo do formato

Insira as definições apropriadas do código de campo (disponíveis do menu de atalho) para indicar quais os dados do Trimble Geomatics Office do projeto devem ser especificados.

Por exemplo, para criar um relatório de lista do ponto de largura fixa, use o seguinte formato:

[Nome:10][Primeira ordenada:14.3][Segunda ordenada:14.3][Elevação:14.3][Código de característica:20]

O cabeçalho do formato ou corpo do formato (mas não ambos) pode ser deixado em branco.

Nota de pé do arquivo do formato

Insira o texto fixo e todas as definições de código de campo (disponíveis no menu de atalho) que devem constituir a nota de pé do relatório. Este campo é opcional e não requer uma definição especificada. Por exemplo, use esta nota de pé para exibir um comando de fim de arquivo.

Pressione a tecla Inserir para adicionar linhas em branco na definição do pé de nota.

Para maiores informações sobre todos os códigos de campo disponíveis no sistema, consulte Códigos de campo – Perspectiva geral.


Relatório Re-computar - Perspectiva geral

O relatório Re-computar é um relatório de HyperText Markup Language (HTML) que resume os resultados do processo de recomputação. Use o relatório Re-computar para eliminar sinalizadores de aviso através de:

  verificação de detalhes de ocupação

  verificação se pontos são nomeados corretamente

  desativação a coordenada se suspeitar que a coordenada foi digitada incorretamente

  re-observação, se necessário

O relatório de re-computar especifica o seguinte:

  Erros de tolerância, onde múltiplas observações ou coordenadas resultam em posições fora da tolerância (as tolerâncias são definidas na guia Re-computar do diálogo Propriedades do projeto).

  Fechamentos onde mais de uma observação ou grupo de coordenadas digitadas podem ser usadas para determinar a posição calculada do ponto e as posições estão dentro da tolerância.

  Observações não usadas e erros.

  Coordenadas de início e a ordem na qual as coordenadas foram derivadas.

  Observações e coordenadas referenciadas no relatório.

O Trimble Geomatics Office cria um relatório de Re-computar cada vez que efetua uma recomputação. O modo da notificação de que um relatório Re-computar foi criado depende do campo Visualizar relatório gerado na guia Relatando do diálogo Propriedades do projeto. O relatório Re-computar sempre é armazenado na pasta Relatórios do projeto. Como todos relatórios do sistema, se um relatório já existir, o relatório antigo será sobrescrito pelo novo relatório.

O relatório Re-computar inclui as seguintes partes:

  Detalhes do projeto

  Erros

  Avisos

  Fechamentos

  Derivações do ponto

  Pontos de início

  Relatório da transversal

  Dados de levantamento (Observações e Coordenadas)


Relatório Recomputar - Seção Detalhes do projeto

A seção Detalhes do projeto do relatório Recomputar resume o nome do projeto e detalhes do sistema de coordenadas.


Relatório Re-computar - Seções de Erro e Aviso

As seções de Erro e Aviso do relatório Re-computar lista todos os pontos onde deriva-se mais de um grupo de coordenadas para um ponto e as coordenadas estão fora da tolerância. Elas também mostram as observações não usadas e quais pontos não podem ser coordenados.

Use estas seções para examinar os erros e avisos e para decidir se deve-se editar o projeto para resolvê-los. Para ver na derivação para um ponto, clique no ponto. Isso o leva à seção Derivação do ponto.

As tolerâncias horizontal e vertical também são mostradas. Estas são especificadas no diálogo Propriedades do projeto – guia Re-computar.


Relatório Re-computar - Seção Derivações do ponto

A seção Derivações do ponto do relatório Re-computar mostra a posição calculada para um ponto. Somente pontos com erros ou fechamentos incluídos no relatório Re-computar têm suas derivações especificadas. As qualidades do componente horizontal (norte, leste), componente da elevação e componente da altura para a posição calculada são exibidos.

Abaixo da posição e qualidades calculadas encontra-se uma lista dos dados de levantamento que podem ser usados para coordenar o ponto.

Cada observação exibe:

  tipo de observação

  ID da observação

  ponto ‘de’ e ‘para’

Para visualizar os detalhes da observação, clique na ID. Isso é ligado à seção Dados de levantamento do relatório Re-computar.

Para selecionar a observação da janela gráficos (e a janela Propriedades), selecione o ícone à esquerda da ID da observação. Este link lhe permite visualizar facilmente as observações com fechamentos fora da tolerância na visualização Levantamento.

Cada coordenada exibe:

  o tipo de coordenada (grid, geodésico ou solução da posição)

  fonte da coordenada

  ID da coordenada

Para visualizar os detalhes da coordenada, clique na ID. Ela é ligada à seção Dados de levantamento do relatório Re-computar.

Novamente, para selecionar o ponto na janela de gráficos e a janela Propriedades, selecione o ícone à esquerda da ID da observação.

A coluna usado para calcular exibe os componentes da posição (NL,l,a) que foram calculados da observação ou coordenada. Por exemplo, se uma observação determina a os componentes Norte, Leste e altura para o ponto, e a coordenada determina a elevação, a coluna Usado para calcular exibe Nla ao lado da observação GPS e l ao lado da coordenada.

As colunas norte do delta, leste do delta, elevação do delta e elipsóide do delta exibem a diferença entre a posição final calculada e a posição calculada usando somente a observação ou coordenada.

Se os valores do delta estão acima das configurações da tolerância especificadas para o projeto, sinalizadores aparecem e os números tornam-se vermelhos. As observações marcadas em vermelho não indicam, necessariamente, uma observação ou coordenada digitada incorreta - re-computar pode ter usado um observação má ou grupo de coordenadas digitadas. Deve-se determinar a causa do erro e desativar todas más observações.

Use a seção de levantamento do relatório para examinar cada observação.

SUGESTÃO: Pode-se usar a janela Propriedades e comando Relatórios / Relatório da divisão do ponto para visualizar o relatório de visualização para qualquer ponto do projeto, incluindo pontos que não são especificados no relatório de Re-computação.


Relatório Re-computar - Seção Relatório transversal

A seção Relatório da Transversal do relatório Re-computar mostra como a recomputação de transversais do ponto inicial e as observações que ele utiliza.

Gera-se um relatório de uma transversal somente se houver mais de um membro do ponto inicial. Isso é para evitar relatórios de offsets.

Por exemplo, se as observações forem:

  Do ponto inicial 1 - ao ponto 2 - ao ponto Relatório 3 e novamente ao ponto 1, cria-se um relatório.

  Do ponto inicial 1 - ao ponto 2, um relatório não é criado.


Relatório Re-computar - seção Fechamento

A seção Fechamentos do relatório Re-computar mostra a lista de pontos da estação com múltiplas observações para um ponto que esteja dentro da tolerância especificada para o projeto. Os fechamentos de todos dados de levantamento para o ponto são mostrados nas colunas Norte, Leste, Elevação do delta e Altura do elipsóide.

Clique num ponto para visualizar os detalhes de derivação. Esse ponto é ligado à seção Derivação do ponto.


Relatório Re-computar - seção Dados de levantamento

A seção Dados de levantamento mostra todas as observações e coordenadas para os pontos mostrados no relatório Re-computar. Os dados de levantamento são organizados por tipo de observação. Use esta seção quando estiver tentando determinar quais informações são incorretas.

Somente observações e coordenadas referenciadas no relatório Re-computar são listadas nesta seção.

Pode-se visualizar todos dados de levantamento na janela Propriedades.


Relatório Re-computar - seção Pontos iniciais

A seção Pontos iniciais do relatório Re-computar exibe os pontos dos quais a recomputação iniciou a produção de observações.


Relatório Re-computar - Detalhes adicionais do sistema de coordenadas

A seção Detalhes adicionais do sistema de coordenadas especifica informações sobre as configurações do local.

As configurações do local são configuradas no diálogo Propriedades do projeto – guia Sistema de coordenadas.


Comando Relatório da derivação do ponto

Use este comando para visualizar o relatório da Derivação do ponto para os pontos selecionados.

Para acessá-lo:

1.	Selecione os pontos que deseja visualizar.

2.	Selecione Relatórios / Relatório da derivação do ponto.

O relatório da Derivação do ponto é exibido no visualizador HTML.


Relatório da derivação do ponto

O relatório da derivação do ponto é uma seção do relatório Re-computar que exibe a posição calculada para um ponto. As qualidades do componente horizontal (Norte, Leste), componente da elevação e componente da altura para a posição calculada são exibidos.

O formato do relatório é o mesmo da seção Derivações do ponto do relatório Re-computar.

Para acessar o relatório:

1.	Selecione os pontos que deseja visualizar.

2.	Escolha uma das seguintes opções:

  Selecione Relatórios / Relatório da derivação do ponto.

  Abra a janela Propriedades / guia Levantamento / página Sumário e selecione a ferramenta Derivação do ponto [image].

O relatório é exibido no visualizador HTML.

NOTA: Para selecionar um ponto na visualização do levantamento, clique no ponto ou ícone da observação à esquerda de ID. Isso é útil para ligar ao ponto da visualização do levantamento.


Comando Relatório inverso

Use este comando para visualizar o mais recente relatório Inverso gerado do diálogo inverso depois de ter sido computado.

Para acessá-lo:

•	Selecione Relatórios / Relatório inverso.

O relatório é exibido no visualizador padrão HTML.


Relatório Inverso

O relatório Inverso pode ser gerado depois de uma computação inversa e exibe informações breves, detalhadas ou combinadas sobre o inverso.

O relatório breve do inverso exibe o azimute do grid, distância do grid e elevação do delta entre os pontos “de” e “para” usados para definir o inverso.

O relatório detalhado exibe as posições dos pontos “de” e “para” em grids, sistemas de coordenadas local (geodésico) e cartesiano (WGS-84) e os parâmetros inversos calculados.

Use o diálogo Inverso para gerar o relatório.

Depois de um relatório ter sido criado, pode-se visualizar o relatório mais recente a qualquer momento, selecionando Relatórios / Relatório inverso.


Relatório Renomear pontos

O relatório Renomear pontos é um relatório que pode ser gerado para exibir o nome do pontos original e novo renomeados depois de usar o comando Renomear pontos.

Use o diálogo Renomear para gerar o relatório.


Relatórios de Importação

Cada vez que um arquivo é transferido para um projeto, o Trimble Geomatics Office cria um relatório de importação para cada arquivo importado. Ele é nomeado <nome do arquivo impotado>.html. Ele contém as seguintes seções:

Detalhes do Projeto

Esta seção resume o nome do projeto e detalhes do sistema de coordenadas.

Mensagens

Esta seção enumera todas mensagens que ocorreram na importação. Se nenhuma mensagem apareceu na importação, esta seção não aparece.

Relatório Re-computar

Este relatório inclui uma ligação ao relatório Re-computar gerada automaticamente depois do processo de importação. O relatório Re-computar resume os resultados do processo de re-computação.

Relatório do Processamento do Código de Característica

O relatório inclui uma ligação ao relatório de codificação da característica se códigos de característica forem processados na importação.

NOTA: Se as ligações do relatório Re-computar ou do relatório do Processamento do código de característica forem vermelhas, isso quer dizer que erros foram encontrados durante o processo e foram exibidos no relatório.

Durante o processo de importação também é criado um relatório Arquivos Importados chamado Importar.html. Este relatório especifica todos arquivos importados para o projeto. Todos arquivos importados em outra sessão para o mesmo projeto são adicionados automaticamente neste projeto.

O modo de notificação destes relatórios é configurado pela opção Visualizar relatório gerado no diálogo Propriedades do projeto – guia Relatando.


Comando Relatórios adicionais

Use este comando para gerar o banco de dados do sistema ou relatórios personalizados fornecidos pelo Trimble Geomatics Office.

Para acessá-lo, selecione Relatórios / Relatórios adicionais. Aparece o diálogo Relatórios adicionais.


Diálogo Relatórios adicionais

Use o diálogo Relatórios adicionais para gerar o banco de dados do sistema ou relatórios personalizados fornecidos pelo Trimble Geomatics Office. Para acessar este diálogo, selecione Relatórios / Relatórios adicionais.

Relatórios do banco de dados do sistema

Relatórios do banco de dados do sistema são formatos predefinidos de relatórios que fornecem um sumário do projeto atual. Apesar de que não se pode, geralmente, editar relatórios, pode-se editar o formato deles. Para fazê-lo, edite o arquivo Asciirpt.dat localizado na pasta Arquivos do Programa\Trimble\Trimble Geomatics Office\Sistema.

Relatórios personalizados

Relatórios personalizados usam os tipos primários de registro ou perguntas definidas no banco de dados, de acordo com suas especificações.

O formato de relatório personalizado pode ser criado, definido ou editado. No entanto, também pode-se evitar a edição destes formatos de relatórios, através da edição do arquivo Asciirpt.dat, localizado na pasta Arquivos do Programa\Trimble\Trimble Geomatics Office\Sistema.

Se o nome do relatório que deseja executar for seguido de reticências, primeiramente devem ser inseridas algumas informações. Por exemplo, quando se opta por executar um relatório de Elevação, o Trimble Geomatics Office lhe pede que insira uma elevação mínima e máxima.

Relatório sobre

São disponíveis duas opções para a criação de um relatório sobre entidades selecionadas ou tipos de registros:

Seleção	Selecione esta opção para criar um relatório sobre entidades selecionadas ou tipos de registros.
Todo o banco de dados	Selecione esta opção para criar um relatório sobre todas as entidades ou tipos de registro.
Quando nada for selecionado, estes botões não são disponíveis e todas entidades ou tipos de registro são especificados.

NOTA: Quando o relatório Detalhes do sistema de coordenadas é selecionado, esta opção não é disponível.

Classificar dados

Pode-se escolher a ordem dos dados no relatório.

Para fazê-lo:

1.	que a caixa de seleção Classificar dados.

2.	2.	Selecione uma ordem de classificação na lista. São as seguintes opções para classificação:

Ordem do banco de dados	Elevação
Nome	Qualidade
Hora de início	Tipo de dados
Período de ocupação
NOTA: As mesmas opções de classificação são disponíveis na janela Propriedades.

SUGESTÃO: Se você criar seus próprios avisos de classificação, elas também aparecem nesta lista.

Relatórios

O grupo de Relatórios especifica os relatórios do banco de dados do sistema ou aqueles personalizados. Uma série de relatórios já foram definidos para serem usados no Trimble Geomatics Office.

OK

Gera o relatório e o exibe no visualizador HTML padrão.

Novo

Cria e define um novo formato de relatório.

Editar

Modifica um formato existente de relatório.

Apagar

Apaga um relatório. Lhe será pedido que confirme a sua ação.

NOTA: Os valores de separação inseridos são interpretados em termos das unidades de coordenadas do banco de dados ao invés das unidades atualmente exibidas. As unidades do banco de dados são especificadas com base nas unidades da visualização no momento que os primeiros dados foram salvados no banco de dados.

SUGESTÃO: Estes relatórios podem ser modificados através da edição do arquivo Asciirpt.dat, localizado na pasta Arquivos do Programa\Trimble\Trimble Geomatics Office\Sistema usando um editor de textos.


    Comando Relatório de Calibração do Local GPS

Use este comando para visualizar o mais recente relatório de Calibração do Local GPS gerado no diálogo Calibração do Local GPS depois de uma computação da calibração.

Para acessá-lo, selecione Relatórios / Relatório de Calibração do Local GPS.

O relatório aparece no visualizador padrão HTML.

NOTA: Este comando não é disponível na visualização do levantamento.

Para acessar o relatório de Calibração do site GPS na visualização do levantamento, clique Relatório no diálogo Calibração do Local GPS.


Relatório da Calibração do Local GPS

O relatório Calibração do Local GPS é gerado depois da computação da calibração. Ele exibe todos parâmetros computados e uma lista de posições de ponto computadas comparadas com as posições conhecidas e valores residuais individuais.

Use o diálogo Calibração do Local GPS para gerar o relatório.


Comando Relatório de transformação da coordenada

Use este comando para visualizar o mais recente relatório de transformação da coordenada gerado no diálogo Transformação da coordenada depois da computação da transformação.

Para acessá-lo, selecione Relatórios / Relatório transformação da coordenada.

O relatório é exibido no browser da rede do Microsoft Internet Explorer.

NOTA: Este comando de menu não está na visualização do levantamento. Para gerar o relatório na visualização do levantamento, marque a caixa de seleção do relatório Gerar a transformação da coordenada no diálogo Transformação da coordenada.


Relatório Transformação da coordenada

O relatório Transformação da coordenada é gerado depois de uma computação da transformação da coordenada e exibe as coordenadas original e transformada.

Use o diálogo Transformação da coordenada para gerar o relatório.

Depois da criação de um relatório, pode-se visualizar o relatório mais recente a qualquer momento, selecionando Relatórios / Relatório da Transformação da coordenada na visualização do plano.


Comando Relatório do Ajuste da elevação

Use este comando para visualizar o mais recente relatório do Ajuste da elevação gerado no diálogo Ajuste da elevação depois que um ajuste é efetuado.

Para acessá-lo, selecione Relatórios / Relatório Ajuste da elevação.

O relatório é exibido no visualizador padrão de HTML.

NOTA: Este comando não é disponível por padrão na visualização do Levantamento. Para gerar o relatório da visualização do Levantamento, marque a caixa de seleção Gerar o ajuste de elevação no diálogo Ajuste da elevação.


Relatório Ajuste da elevação

O relatório Ajuste da elevação é gerado depois de um ajuste da elevação e exibe as coordenadas originais e ajustadas.

Use o diálogo Ajuste da elevação para criar o relatório.

Uma vez que um relatório seja criado, pode-se visualizar o mais recente relatório a qualquer momento, selecionando Relatórios / Relatório do Ajuste da elevação na visualização do plano.


Relatório do Processamento de Código de Característica

O relatório do Processamento de Código de Característica é gerado depois de uma operação de processamento do código.

Através da configuração da opção Visualizar relatório gerado no diálogo Propriedades do projeto - guia Geral, um notificação é recebida quando este relatório é gerado.

O relatório resume a operação do processamento e inclui detalhes sobre o arquivo Biblioteca de Características e Atributos (.fcl), usado e qualquer problema encontrado durante o processamento de códigos de características.


Relatório Colagem do projeto

O relatório Colagem do projeto é gerado depois que os pontos foram copiados e colados num projeto.

Através da configuração da opção Visualizar relatório gerado no diálogo Propriedades do projeto - guia Geral recebe-se a notificação quando este relatório é gerado.

O relatório resume todas características e atributos designados a um ponto copiado que não são coladas se as definições do atributo entre os projetos diferir.


Comando Relatório do nível

Use este comando para visualizar o relatório do Nível para o arquivo selecionado.

Para acessá-lo:

1.	Selecione Relatórios / Relatório do Nível.

2.	Selecione o arquivo nível.

O Relatório do nível para o arquivo do nível selecionado é exibido no visualizador padrão HTML.


Relatório do Nível

O relatório do nível exibe as observações do nível e dados para o seu arquivo do nível.

Para acessá-lo:

1.	1.	Selecione Relatórios / Relatórios do nível.

2.	Selecione o arquivo do nível.

O relatório é exibido no visualizador padrão de HTML. Ele exibe as seguintes informações:

Dados de nivelamento

Esta seção exibe a execução do nível num formato de caderno de campo do nível. Ele exibe observações da visada atrás, visada intermediária, visada adiante e informações que foram exibidas no diálogo Importação do nível digital.

Obsevações de nivelamento

A tabela das observações de nivelamento exibem as seguintes informações:

  ID

  Do ponto

  Para ponto

  Qualidade

  Elvação Δ – estes valores são computados entre os pontos da estação.

SUGESTÃO: Para selecionar a observação de nivelamento na janela de gráficos, selecione a ID da observação. Esta ligação lhe permite visualizar com facilidade a observação do nível na janela Propriedades.

NOTA: O relatório do nível será armazenado no diretório <Nome do projeto>\Relatórios\Nível.


Comando Todos

Use este comando para selecionar todas a entidades do projeto atual.

Para acessá-lo, escolha Selecionar / Todos.

Visualização do levantamento

Se você estiver trabalhando na visualização do Levantamento, todas as entidades visíveis serão selecionadas.

Por exemplo, se você usar o comando Visualizar / Filtros para ocultar algumas observações, e usar então o comando Selecionar / Todos, as observações ocultas não são selecionadas.

Visualização do plano

Se você estiver trabalhando na visualização do Plano, todas as entidades são selecionadas, se estiverem numa camada que possua:

  a sua Propriedade Visível configurada para ligado

  a sua Propriedade Bloqueada configurada para desligado.

Por exemplo, se você utilizar a ferramenta Seleção da camada

para ligar a propriedade Bloqueada de uma camada, use então o comando Selecionar / Todos, todas entidades na camada bloqueada não serão selecionadas.

SUGESTÃO: A barra de status mostra um sumário do número de entidades selecionadas.


Comando Nenhum

Use este comando para limpar a seleção.

Para acessá-lo, escolha Selecionar / Nenhum.

SUGESTÃO: A barra de status mostra uma mensagem indicando que a seleção está vazia.


Comando Pontos

Use este comando para abrir o diálogo Pontos.

Para acessá-lo, escolha Selecionar / Pontos.


Diálogo Selecionar pontos

Perspectiva geral	Como ...

Use este diálogo para selecionar pontos usando os critérios especificados. Pode-se usar  curingas e espaços. Pode-se também inserir critérios em mais de uma guia. O Trimble Geomatics Office somente seleciona pontos que satisfaçam todos os critérios.

Para acessá-lo, escolha Selecionar / Pontos.

Se você acessar este diálogo usando a visualização de Levantamento, o Trimble Geomatics Office somente considera os pontos que estão atualmente visíveis. Isso significa que você usou o diálogo Visualizar filtros para filtrar observações, estas não serão selecionadas. Quando estiver usando visualização do Levantamento, as informações da camada (que estão disponíveis na visualização do Plano) serão ignoradas nos critérios da seleção.

Se você acessar este diálogo usando a visualização do Plano, o Trimble Geomatics Office somente considera os pontos que estão atualmente visíveis e não bloqueados. Quando estiver usando a visualização do Plano, todo filtro da visualização aplicado na visualização do Levantamento será ignorado.

As guias são:

  Geral

  GPS

  Ocupação

Adicionar à seleção atual

Se você possuir uma ou mais entidades selecionadas ao acessar este diálogo, este quadro de verificação torna-se disponível. Se desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro de verificação.


Diálogo Selecionar Pontos - guia Geral

Use esta guia para inserir critérios nos campos gerais do ponto.

Combinação do nome e combinação do código de característica

Use estes campos para selecionar por nome (e código de característica). Nomes separados por uma vírgula podem ser introduzidos. Por exemplo, “100,250,1020” seleciona separadamente estes nomes se eles existirem no projeto. As reticências (...) ou um hífen (-) selecionam cada ponto com o nome especificado dentro do espaço.

Com um limite que inclua nomes alfanuméricos, algumas entidades não esperadas podem ser selecionadas desde que está sendo usado um grupo alfabético completo.

NOTA: Se os nomes do espaço de início e de fim forem numéricos, então um espaço numérico é selecionado.

Pode-se usar curingas nestes campos.

NOTA: Onde o nome conter um hífen, inclua o hífen entre aspas. Por exemplo, o nome de ponto “a-2” é inserido como “a-2”. Caso contrário, o Trimble Geomatics Office classifica o espaço a partir de 2.

Use aspas duplas para evitar a união do padrão em nomes que contenham curingas. Por exemplo, "URS#1"..."URS#8" não permite que # seja usado como curinga no espaço da seleção e seleciona os pontos com nomes explícitos entre URS#1 e URS#8.

Nomes não são sensitivos ao fato de serem em maiúsculas ou minúsculas.

Com qualidades do ponto

A partir da lista, selecione as qualidades do componente da posição do ponto nos seus critérios. Pode-se selecionar várias qualidades de ponto.

De fontes

A partir da lista, selecione as fontes do ponto. Pode-se selecionar várias fontes. Pontos com dados de levantamento de ao menos uma fonte marcada serão selecionados.

Com código de característica

Insira os códigos de característica a serem usados para selecionar pontos.

De camadas

Esta opção não está disponível quando se acessa este diálogo da visualização do Levantamento.

Use a lista para selecionar camadas nos seus critérios. Pode-se selecionar várias camadas. Todos pontos nas camadas selecionadas serão selecionados.

Com estilos de ponto

A partir da lista, selecione estilos CAD de ponto nos seus critérios. Pode-se selecionar vários estilos de ponto. Todos pontos com o estilo de ponto (especificado na janela Propriedades – guia CAD são selecionados.

Adicionar à seleção atual

Se você possuir uma ou mais entidades selecionadas ao acessar este diálogo, este quadro de verificação torna-se disponível. Se você desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro de verificação.


Diálogo Selecionar pontos - guia GPS

Use esta guia para inserir os critérios de seleção usando os dados GPS. Os critérios aplicam-se às linhas de base GPS pós processadas e RTK.

Se um ponto possui ao menos uma linha de base que satisfaça aos critérios, o ponto é selecionado.

Precisão Horizontal, Precisão Vertical

Clique o botão menor-que-e-igual-a ou maior-que-e-igual-a para selecionar os seus critérios.

Insira valores usando o teclado para inserir os valores de precisão.

Se você deixar um dos campos como um ponto de interrogação (?), o campo não é usado nos critérios de seleção.

Tipos de solução

Para usar os tipos de solução dos seus critérios, faça uma escolha da lista. Pode-se selecionar vários tipos de solução. Todos pontos com observações GPS (com os tipos selecionados de solução) a eles são selecionados.

Métodos de Campo

A partir da lista, selecione o método de campo que deseja usar nos seus critérios. Pode-se selecionar vários métodos de campo.

NOTA: Somente pontos que satisfaçam tanto os tipos de solução como o método de campo são selecionados.

Adicionar à seleção atual

Se você possuir uma ou mais entidades selecionadas quando acessar este diálogo, este quadro de seleção torna-se disponível. Se desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro.


Diálogo Selecionar pontos - guia Ocupação

Use esta guia para inserir critérios de solução usando os detalhes de ocupação. São selecionados todos os pontos com ao menos uma ocupação que satisfaçam os critérios.

Todas as estações de base e configurações do instrumento

Selecione este quadro de verificação para escolher todos os pontos GPS da estação base e pontos de configuração terrestre.

Com antena ou altura do destino entre

Use estes campos para inserir uma altura de antena ou limites da altura do destino nos seus critérios. O valor inserido no primeiro campo deve ser menor que o valor inserido no segundo campo. Os valores inseridos estão incluídos.

Ocupado entre horários

Selecione este quadro de verificação para inserir um limite de data e hora a ser usado nos seus critérios. São selecionadas as ocupações para pontos com o horário de início e de parada dentro deste limite. O software salva os valores inseridos para a próxima vez que usar esta opção.

Observado do ponto

Insira um nome de ponto que possui observações a partir dele. O ponto pode ser uma estação de base GPS ou um ponto de demarcação terrestre.

Use o preenchimento de campo para selecionar um ponto na janela de gráficos.

Adicionar à seleção atual

Se uma ou mais entidades estiverem selecionadas ao acessar este diálogo, este quadro de verificação torna-se disponível. Se desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro de verificação.


Selecionando Entidades - Uso de Curingas

 Perspectiva geral e Outras Informações

Ao selecionar pontos através do diálogo Selecionar / Pontos, ou selecionar observações usando o diálogo Selecionar / Observações, pode-se usar curingas em alguns campos para selecionar uma série de valores.

Pode-se usar os seguintes curingas:

Pode-se também usar vários curingas. Por exemplo, 1?0*0 combina com  1500, 1A0250, 15020.

A seguinte tabela mostra como pode-se usar os tipos de combinações para testar os padrões.

Considera-se que o nome do ponto “10” cai entre “1” e “a”. Ele não cairá dentro dos limites de “1” à “9” porque ambos nomes são numéricos.


    Comando Observações

Use este comando para abrir o diálogo Selecionar observações.

Para acessá-lo, escolha Selecionar / Observações.


    Diálogo Selecionar observações

Mais informações

Perspectiva geral	Como ...

Para acessá-lo, escolha Selecionar / Observações.

Use este diálogo para selecionar observações usando os critérios especificados. Pode-se usar curingas e espaços. Pode-se também inserir critérios em mais de uma guia. O software Trimble Geomatics Office somente seleciona observações que satisfaçam todos os critérios.

As guias são:

  Geral

  GPS

Adicionar à seleção atual

Se houverem uma ou mais entidades selecionadas ao acessar este diálogo, este quadro de verificação estará disponível. Se desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro de verificação.


    Diálogo Selecionar observações - guia Geral

Use esta guia para inserir critérios gerais para a seleção de observações.

Da combinação do ponto, Para combinação do ponto

Podem ser inseridos nomes separados por uma vírgula. As reticências (...) ou um hífen (-) selecionam cada linha de base com o nome especificado dentro do espaço denotado pelas reticências. Com um limite que inclua nomes alfanuméricos, algumas entidades não esperadas podem ser selecionadas desde que está sendo usado um grupo alfabético completo.

NOTA: Se os nomes do espaço de início e de fim forem numéricos, então um espaço numérico é selecionado

Pode-se usar curingas.

Com distância de declive entre

Use estes campos para inserir os limites da distância do declive nos seus critérios. O valor inserido no primeiro campo deve ser menor que o valor inserido no segundo campo. Os valores inseridos estão incluídos.

Se houver uma observação reduzida com uma distância horizontal dentro dos limites especificados, também são selecionadas as observações.

Tipos

Desta lista, selecione as fontes de observações. Pode-se selecionar fontes múltiplas. Todas observações com ao menos uma fonte de observação são selecionadas.

De fontes

A partir da lista, selecione as fontes de observação. Pode-se selecionar várias fontes. Todas as observações com ao menos uma fonte de observação são selecionadas.

Com status

A partir da lista, selecione o status da observação nos seus critérios.

Com ID de observação

Inserir a ID de observação ou uma série de IDs de obsrevações para selecionar as observações. Por exemplo, para selecionar a linha de base 8, insira BL8. Insira BL8−BL12 para selecionar todas observações dentro daquele limite.

Somente passagem lateral

Quando esta caixa de seleção está marcada, somente passagem lateral será selecionada.

Adicionar à seleção atual

Se uma ou mais entidades estiverem selecionadas quando se acessa este diálogo, este quadro de verificação torna-se disponível. Se desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro de verificação.


    Diálogo Selecionar observações - guia GPS

Use esta guia para inserir critérios para a seleção de linhas de base GPS.

Índice

Selecione o sinal menor que ou maior que. Insira o valor do índice que deseja usar nos seus critérios.

Variância da ref.

Selecione o sinal menor que ou maior que. Insira a variância de referência que deseja usar nos seus critérios.

RMS

Selecione o sinal menor que ou maior que. Insira o valor RMS que deseja usar nos seus critérios.

Prec Horz

Clique o botão menor-que-e-igual-a ou maior-que-e-igual-a para selecionar o sinal para os seus critérios. Insira o valor de precisão horizontal que deseja usar nos seus critérios.

Prec Vert

Clique o botão menor-que-e-igual-a ou maior-que-e-igual-a para selecionar o sinal para os seus critérios. Insira o valor de precisão vertical que deseja usar nos seus critérios.

NOTA: As perguntas da Prec horz e Prec vert são baseadas em valores exatos. Valores apresentados tais como os campos na janela de propriedades são números arredondados.

Tipos de solução

A partir da lista, selecione os tipos de solução que deseja usar nos seus critérios. Pode-se selecionar vários tipos de solução.

Métodos de campo

A partir da lista, selecione os métodos de campo GPS que deseja usar nos seus critérios. Pode-se selecionar vários métodos de campo.

NOTA: Somente observações que satisfaçam tanto os tipos de solução como os métodos de campo são selecionadas.

Observado entre

Use estes campos para especificar um limite de data e hora para o seus critérios. São selecionadas as observações com um horário de início e um de fim dentro do critério especificado. O software salva os valores inseridos para a próxima vez que usar esta opção.

Observados por mais de (seg)

Use este campo para selecionar linhas de base GPS que foram observadas durante mais tempo que aquele especificado. O campo possui o formato hh:mm:ss.

NOTA: Pode-se usar o campo de preenchimento para especificar o horário.

Adicionar à seleção atual

Se você possuir uma ou mais entidades selecionadas ao acessar este diálogo, este quadro de verificação torna-se disponível. Se desejar limpar a seleção atual antes de aplicar a seleção resultante deste diálogo, limpe este quadro de verificação.


    Comando Por camada

Use este comando para selecionar todas as entidades em camadas específicas.

Para acessá-lo:

•	Escolha Selecionar / Por camada.

Abre-se o diálogo Selecionar por Camadas.


    Diálogo Selecionar por Camadas

Use este diálogo para selecionar entidades nas camadas escolhidas.

Para acessá-lo:

•	Escolha Selecionar / Por camada.

Camadas

A lista de Camadas mostra os nomes das camadas no projeto.

Para selecionar entidades que aparecem em uma camada, marque o quadro de verificação ao lado do nome da camada.

Se a camada tiver a sua propriedade Bloqueado configurada para ligado, o quadro de verificação para a camada aparece sombreado. Para habilitar a camada a ser selecionada, use a ferramenta Seleção da camada ou o diálogo Camada para mudar as propriedades de Bloqueado e Visível. O quadro de verificação para a camada torna-se então disponível.

Todos

Clique Todos para selecionar cada camada apresentada na lista de Camadas.

Nenhum

Clique Nenhum para limpar os quadros de verificação para todas as camadas da lista de Camadas.


    Comando por Estilos

Use este comando para selecionar todas as entidades usando estilos específicos.

Para acessá-lo, escolha Selecionar / por Estilos.

Abre-se o diálogo Selecionar por Estilos.


    Diálogo Selecionar por Estilos

Use este diálogo para selecionar todas as entidades CAD (pontos, linhas, arcos, curvas, anotações, texto) na visualização do Plano que possui os estilos especificados.

Para acessá-lo, escolha Selecionar / Por Estilos.

Estilos

Selecione a guia de um determinado tipo de estilo. Os estilos são os mesmos daqueles disponíveis no diálogo Estilos CAD. Selecione um estilo da lista que aparece. Somente pode-se usar uma guia para selecionar entidades. Se você selecionar um ou mais estilos da uma guia, e escolher então outra guia, todas as seleções feitas na guia anterior serão perdidas.

Para selecionar vários tipos de entidade (por exemplo, pontos e linhas) use este diálogo para fazer uma seleção, salve o grupo de seleção, e então selecione os outros tipos de entidade. Salve o novo grupo de seleção. Pode-se recuperar ambos grupos de seleção ao mesmo tempo usando Selecionar / Grupos de seleção / Recuperar.

Use a opção <Por Camada> para selecionar entidades que possuam o grupo de campo apropriado ajustado para <Por Camada>.

Todos

Clique Todos para selecionar cada estilo apresentado no quadro da lista de Estilos.

Nenhum

Clique Nenhum para limpar todos os quadros de verificação apresentados no quadro da lista de Estilos.


    Comando Por Tipo

Use este comando para selecionar todas as entidades de um tipo especificado.

Para acessá-lo, escolha Selecionar / Por Tipos.

Abre-se o diálogo Selecionar por Tipo.


    Diálogo Selecionar por Tipo

Use este diálogo para selecionar entidades com tipos específicos.

Para acessá-lo, escolha Selecionar / Por Tipos.

Tipos

A lista de Tipos mostra os nomes de todos os diferentes tipos de entidade (pontos, linhas, curvas, arcos, anotações, texto).

Selecione o quadro de verificação de um determinado tipo para selecionar as entidades daquele tipo.

Todos

Clique Todos para selecionar cada tipo apresentado no quadro da lista de Tipos.

Nenhum

Clique Nenhum para limpar os quadros de verificação para cada tipo apresentado no quadro da lista de Tipos.


Comando Por Pergunta

Use este comando para selecionar entidades que combinem com as condições especificadas em perguntas.

Para acessá-lo, escolha Selecionar / Por Pergunta.

Aparece o diálogo Por Pergunta.


Diálogo Selecionar por Pergunta

 Perspectiva geral e Outras Informações

Use este diálogo para escolher um pergunta na seleção de entidades.

Para acessá-lo, escolha Selecionar / Por Pergunta.

Perguntas

A lista de perguntas disponíveis inclui todas as perguntas personalizadas que foram definidas no projeto como também o seguinte:

Nome da pergunta	Seleciona…
Todos eventos	Observações com registros de observações
Pontos GPS autônomos	pontos que possuem posições autônomas. Por exemplo, pontos num arquivo .dat que não foi processado.
Linhas de base usando receptor…	linhas de base que foram observadas usando o mesmo receptor. Insira o valor no diálogo Entrada do parâmetro.
Pontos observados convencionalmente	pontos que foram observados com o uso de instrumentos convencionais.
Índice de elevação	pontos que possuem elevações dentro dos limites especificados. Insira valores no diálogo Entrada do parâmetro.
Pontos digitados no WGS-84	pontos que foram digitados em pontos WGS-84.
Pontos de telêmetro a laser	pontos que foram observados com o uso do telêmetro a laser.
Notas	todos registros de notas do projeto. Notas podem ser adicionadas no campo quando se usa o Trimble Survey Controller. Use esta seleção para selecionar notas para criar relatórios personalizados.
Coordenadas nulas	pontos que possuem coordenadas nulas. Isso pode acontecer quando se observa que um ponto de visada atrás não possui coordenadas.
Elevações nulas	pontos que possuem elevações nulas.
Pontos por descrição	pontos que possuem um campo de descrição tal como especificado. Insira valores no diálogo Entrada do parâmetro. Pode-se usar caracteres curinga.
Pontos observados várias vezes	pontos que foram observados mais de uma vez. Esta pergunta usa todos tipos de observação. Para observações terrestres, a pergunta usa configurações da meta. Para ocupações  RTK, usa ocupações GPS para o ponto. Para ocupações estáticas e faststatic, usa as ocupações onde o ponto é o ponto ‘para’ das observações. A pergunta soma então todos eles e seleciona os pontos onde o total é maior que um.
Pontos com nomes diferentes dentro da distância	pontos que possuem nomes diferentes e estão dentro da distância especificada. Insira valores no diálogo Entrada do parâmetro.
Pontos sem nomes	pontos que não possuem nomes.
Vetores RTK com covariantes (QC2)	Vetores RTK que possuem registros QC2. Estes pontos podem ser usados num Ajuste de Rede (se tiver instalado o módulo de Ajuste da Rede).
Linhas de base não processadas	linhas de base que podem ser, mas que não foram processadas.
As perguntas selecionam entidades de acordo com a definição da pergunta e uma descrição da pergunta é apresentada na barra de status.

Por exemplo, pode-se selecionar pontos que possuam uma determinada série de elevações.

Onde perguntas requerem parâmetros, o nome é seguido por reticências. Se você escolher tal pergunta, lhe será pedido que forneça os valores do parâmetro.

Seleção

No grupo de Seleção, pode-se efetuar três operações de seleções:

  Novo − cria um novo grupo de seleção.

  Adicionar ao atual – adiciona o grupo de seleção ao grupo atual de seleção.

  Refinar atual − encontra pontos que são comuns com o grupo de seleção que se está para criar, usando o atual grupo de seleção.

Por exemplo, se você contar com um projeto no qual queira encontrar todas as linhas de base não processadas observadas usando um receptor GPS com número serial 1234, faça o seguinte:

1.	Use a pergunta para selecionar todas as linhas de base não processadas.

2.	Use a pergunta novamente para selecionar as linhas de base usando a opção do receptor.

3.	No grupo de Seleção, escolha a opção Refinar atual.

4.	Insira o número serial do receptor (1234) no diálogo Selecionar por pergunta - Parâmetros.

Todas as linhas de base não processadas que foram observadas com o receptor 1234 serão selecionadas.


Comando por característica de ponto

Use este comando para selecionar pontos que possuam códigos de característica com atributos que combinem com nomes especificados.

Para acessá-lo, escolha Selecionar / por característica de ponto.

Aparece o diálogo Selecionar por característica de ponto.


Diálogo Selecionar por característica de ponto

Use este diálogo para selecionar pontos que possuam informações de característica e atributo coletadas para si. Para visualizar as características e atributos coletados para o ponto, use a janela – guia Atributos.

Características

A lista de características apresenta todas as características com definições de atributos que existem em arquivo (*.fcl) Selecionar Biblioteca de Características e Atributos ou arquivo (*.ddf) do Dicionário de Dados usados para configurar o projeto para atributos.

Selecione os quadros de verificação para as características. Pontos com ao menos uma das características especificadas são selecionados.

Todos

Para selecionar todos os quadros de verificação, clique Todos.

Nenhum

Para limpar todos os quadros de verificação, clique Nenhum.


Grupos de Seleção - Perspectiva geral

Mais Informações

 Como ...

Perspectiva geral

Um grupo de seleção é qualquer coisa que foi selecionado atualmente no Trimble Geomatics Office. Pode-se salvar a seleção atual configurada a qualquer tempo e recuperando-a mais tarde. Por exemplo, pode-se registrar um grupo de seleção de todos os pontos de controle dentro do projeto e fazer relatórios deles regularmente, pela recuperação do grupo de seleção. Estes grupos de seleção salvados mantêm a ordem das suas entidades. Se entidades que fazem parte do grupo de seleção forem apagadas, o grupo de seleção ainda trabalha com as entidades que sobram.

NOTA: Pode-se exibir grupos de seleção usando a opção Exibir somente dados do grupo de seleção no diálogo Visualizar filtros.

Quando se importa um arquivo, o Trimble Geomatics Office produz, automaticamente, um grupo de seleção com nome. Um grupo de seleção registra a ordem na qual os dados foram coletados. Isso é importante para tarefas tais como codificação de característica. Para arquivos do Survey Controller (*.dc), o Trimble Geomatics Office fornece ao novo grupo de seleção o nome do identificador do trabalho importado. Para outros arquivos, tais como arquivos ASCII, o Trimble Geomatics Office fornece ao novo grupo de seleção o nome do arquivo.

NOTA: Se você importar dados RTK nos quais a inicialização foi perdida nos primeiros 15 minutos, um alto grupo de seleção RMS é criado na importação.


Grupos de Seleção - comando Salvar

Use este comando para salvar o atual grupo de seleção.

Para acessá-lo:

•	Escolha Selecionar / Grupos de Seleção / Salvar.

Aparece o diálogo Salvar.

Este comando não é disponível se não existe nada atualmente selecionado.


Grupos de Seleção - diálogo Salvar

 Perspectiva geral e Outras Informações

Use este diálogo para salvar o grupo atual de seleção.

Para acessá-lo, escolha Selecionar / Grupos de Seleção / Salvar.

Nome

Insira um nome novo que ainda não exista para o grupo de seleção.

OK

Clique OK para criar o grupo de seleção.

A seleção aparece no diálogo Recuperar na próxima vez que ele é aberto. O novo grupo de seleção é adicionado à lista do grupo de seleção que foi usado recentemente. Para abrir o diálogo Recuperar e visualizar os grupos de seleção recentemente usados, escolha Selecionar / Grupos de Seleção.


Grupos de Seleção - comando Recuperar

Use este comando para recuperar um grupo de seleção. Este comando não é disponível se não houverem grupos de seleção a serem recuperados.

Para acessá-lo:

•	Escolha Selecionar / Grupos de Seleção / Recuperar.

Aparece o diálogo Grupos de Seleção – Recuperar.


Grupos de Seleção - diálogo Recuperar

 Perspectiva geral e Outras Informações

Use este diálogo para recuperar um ou mais grupos de seleção de uma vez. Por exemplo, se foram salvados dois grupos de seleção, use este diálogo para selecionar todas as entidades em ambos grupos de seleção.

Para acessá-lo, escolha Selecionar / Grupos de Seleção / Recuperar.

Grupos de Seleção

Esta lista contém todos os grupos de seleção salvados para o projeto.

Todos

Clique Todos para selecionar cada grupo de seleção.

Nenhum

Clique Nenhum para limpar os quadros de verificação para todos os grupos de seleção.


Grupos de Seleção - comando Editar

Use este comando para editar os detalhes de grupos de seleção salvados. Este comando não é disponível se não houverem grupos de seleção para serem editados.

Para acessá-lo, escolha Selecionar / Grupos de Seleção / Editar.

Aparece o diálogo Editar.


Grupos de Seleção - diálogo Editar

 Perspectiva geral e Outras Informações

Use este diálogo para renomear ou apagar grupos de seleção salvados.

Grupos de Seleção

Realçar o grupo de seleção que deseja editar ou apagar.

Renomear

Clique Renomear para renomear o grupo de seleção realçado.

Apagar

Clique Apagar para apagar o grupo de seleção realçado.


Grupos de Seleção - diálogo Renomear

 Perspectiva geral e Outras Informações

Use este diálogo para renomear o grupo de seleção realçado.

Para acessá-lo:

1.	Escolha Selecionar / Grupos de Seleção / Editar. Aparece o diálogo Editar.

2.	Clique Renomear. Aparece o diálogo Renomear.

Nome

Insira um nome novo que ainda não exista para o grupo de seleção.

OK

Clique OK para aplicar as mudanças.

Aparece o grupo de seleção no diálogo Editar. Aparece o novo grupo de seleção na lista de grupos de seleção recentemente usados.


Selecionando Entidades - Perspectiva geral

Algumas vezes quer-se efetuar uma ação sobre somente um assunto do projeto (por exemplo, processamento de códigos de característica). Pode-se selecionar entidades (pontos, linhas, arcos, curvas, texto, anotações, observações) no projeto em duas maneiras:

  Usando o mouse.

  Usando o menu Selecionar.

Usando o mouse para selecionar entidades

Para selecionar uma entidade, clique-a usando o mouse (para selecionar várias entidades, pressione Shift.).

Pode-se então efetuar as tarefas requeridas nas entidades selecionadas.

Para fazer uma seleção inversa, pressione Ctrl. Todas entidades atualmente selecionadas serão de-selecionadas, e vice-versa.

Nota: Pode-se usar o mouse para visualizar entidades na janela Propriedades sem ter que voltar a selecioná-las continuamente. Pressione e mantenha apertado o botão do mouse sobre um ponto por alguns segundos, então arraste o ponteiro sobre a entidades que deseja visualizar.

Usando o menu Selecionar para selecionar entidades

O menu Selecionar contém muitos diferentes métodos para seleção de pontos. As opções do menu selecionar dependem se você está na visualização de Levantamento ou visualização do Plano.


Pontos Duplicados - comando Por Coordenadas

Use este comando para selecionar pontos que possuam coordenadas idênticas.

Para acessá-lo, escolha Selecionar / Pontos Duplicados / Por Coordenadas.


Pontos Duplicados - comando Por Nome

Use este comando para selecionar pontos que possuem nomes duplicados.

Para acessá-lo:

•	Escolha Selecionar / Pontos Duplicados / Por Nomes.

SUGESTÃO: Use este comando antes de combinado pontos duplicados.


Pontos Duplicados - comando Por Nome e Distância

Use este comando para selecionar pontos que possuem nomes duplicados e estão dentro da distância especificada. Insira valores no diálogo Entrada de Parâmetro.

Para acessá-lo:

•	Escolha Selecionar / Pontos Duplicados / Por Nome e Distância.


Diálogo Selecionar Pontos Piquetados

Use este diálogo para selecionar pontos selecionados usando uma série de avisos. Estas ferramentas de seleção podem ser usadas com os relatórios adicionais e as opções de exportação personalizada.

Para acessá-la, escolha Selecionar / Pontos piquetados.

Perguntas

A lista de perguntas disponíveis incluem todas perguntas personalizadas que foram definidas no projeto, além do seguinte:

Nome da pergunta	Seleciona …	Insira esta informação no diálogo Entrada do parâmetro …
Todos pontos piquetados	todos pontos que foram piquetados no campo.
Pontos do arco	pontos que possuem referência a um arco. Por exemplo, pontos que foram piquetados em, de e para um arco.	nome do arco
Pontos MTD	pontos que possuem uma referência a um MTD. Por exemplo, pontos que foram piquetados em, de e para um MDT.	Nome do MTD
Pontos da linha	pontos que possuem uma referência a uma linha. Por exemplo, pontos que foram piquetados em, de ou para uma linha.	nome da linha
Pontos de desenho	pontos que possuem uma referência para um ponto do desenho. Por exemplo, pontos que foram piquetados de, para ou num ponto de desenho.	nome do ponto do desenho
Pontos da estrada	pontos que possuem referência a um ponto da estrada. Por exemplo, pontos que foram piquetados de, para ou numa estrada.	nome da estrada
Pontos de encontro de uma estrada	pontos de encontro de uma estrada.	nome da estrada
Pontos numa estrada com característica	pontos numa estrada com uma característica.	nome de estrada e característica
Todos pontos com erros de piquetagem maiores que	pontos com erros de piquetagem maiores que o erro horizontal e erro vertical especificados no diálogo Entrada do parâmetro.
Quando uma pergunta requer um parâmetro, o nome é seguido de reticências. Se escolher uma destas perguntas, lhe será pedido que forneça os valores do parâmetro.

Seleção

No grupo Seleção, pode-se efetuar três operações de seleção:

  Novo − cria um novo grupo de seleção

  Adicionar ao atual − adiciona o grupo de seleção que se está para criar ao grupo atual da seleção

  Refinar atual − usando o grupo atual de seleção, encontra pontos que são comuns com o grupo de seleção que se está para criar.

Por exemplo, pode-se ter um projeto no qual deseja encontrar todas linhas de base não processadas que foram observadas com o uso de um receptor GPS com  o número serial 1234. Para fazer isso:

1.	Use a pergunta para selecionar todas as linhas de base não processadas.

2.	Use a pergunta novamente para selecionar a opção Linhas de base usando receptor… No grupo de seleção, selecione a opção Refinar atual. Insira o número serial do receptor (1234) no diálogo Selecionar por pergunta - Parâmetros.

Todas linhas de base não processadas que foram observadas com o receptor 1234 serão selecionadas.


Selecionar Pontos de Calibração

Use esta opção para selecionar os pontos de calibração que aparecem na Calibração do Local GPS − Lista do ponto no seu projeto Trimble Geomatics Office.

Para acessá-la, escolha Selecionar / Pontos de calibração.

Todos pontos de calibração que aparecem na Calibração do Local GPS – Lista do ponto serão selecionados no seu projeto.

NOTA: Se não houverem pontos na lista de Pontos de calibração, esta opção não será disponível.


Suporte Técnico

Se você tiver algum problema e não puder encontrar as informações necessárias na  documentação do produto, entre em contato com o revendedor da sua região. Ou então, peça suporte técnico através do site WWW da Trimble    (http://www.trimble.com/support/support.htm).


Barras de ferramentas - Perspectiva Geral

Uma barra de ferramentas consiste em uma ou mais ferramentas. As barras de ferramentas são separadas por linhas verticais na janela de gráficos do Trimble Geomatics Office. Uma ferramenta é um atalho para comandos de menu usados com freqüência.

Para visualizar uma descrição da ferramenta, coloque o ponteiro do mouse sobre a ferramenta de visualize:

  um Dica de ferramenta

  a barra de status

Para mudar a ordem em que as barras de ferramentas são posicionadas na janela Trimble Geomatics Office, arraste uma barra de ferramentas usando a linha vertical que separa a barra de ferramentas dos outros itens da janela.

As seguintes barras de ferramentas são disponíveis tanto na visualização do Levantamento como na visualização do Plano:

  Padrão

  Visualizações

  Controles da visualização

As seguintes barras de ferramenta são disponíveis somente na visualização de Levantamento:

  Filtros

  Linha do tempo (se tiver instalado o módulo de Processamento da linha de base)

  Traçados da linha do tempo (se tiver instalado o módulo de Processamento da linha de base)

  Controles da elipse (se tiver instalado o módulo de Ajuste da rede)

As seguintes barras de ferramentas são disponíveis somente na visualização do Plano:

  Camadas

  CAD


Barra de ferramenta CAD

A barra de ferramentas CAD fornece um acesso rápido às características comuns do menu Inserir.

Esta ferramenta …	abre este diálogo …	Use-a para adicionar estes itens ao banco de dados …
	Inserir pontos	registros de ponto
	Inserir pontos por azimute e distância	registros de ponto
	Inserir trabalho do linha	registros de linha
	Inserir trabalho da linha	registros de curva
	Inserir trabalho da linha	registros de arco
	Inserir texto	registros de texto


Barra de ferramentas Padrão

A barra de ferramentas Padrão fornece um acesso rápido para algumas opções principais disponíveis no menu Arquivo e menu Editar.

Ferramenta	Selecione-a para …
	criar um novo projeto
	abrir um projeto existente
	importar dados de um arquivo, dispositivo ou receptor GPS
	exportar dados para um arquivo, dispositivo ou receptor GPS
	cortar a seleção e colocá-la numa área de transferência
	copiar a seleção e colocá-la numa área de transferência
	colar o conteúdo da área de transferência
	desfazer a última ação
	refazer a última ação que foi desfeita
	abrir a janela Propriedades e visualizar ou editar as propriedades da seleção atual.


Ferramenta Editar camadas

Selecione [image]  para exibir o diálogo Camadas. Use este diálogo para administrar as camadas.


    Ferramenta Seleção da camada

A camada exibida é a camada atual. Para mudar a camada atual, clique a seta e selecione a camada da lista de caída.

O ícone lâmpada indica se a camada é visível ou não. Para mudar a visibilidade de qualquer camada, clique a lâmpada da camada apropriada.

O brilho do ícone lâmpada diminui. Para tornar uma camada visível, clique no ícone lâmpada novamente. Se uma ou mais camadas tiver sua propriedade Visível desativada, aparece um ícone lâmpada na barra de status.

O ícone cadeado indica se a camada está chaveada ou não. Se a propriedade bloqueado estiver ativada, não pode-se selecionar nenhuma entidade da camada, mesmo que elas possam ser vistas na janela de gráficos.

Para mudar a propriedade bloqueado de qualquer camada, clique no ícone cadeado para a camada apropriada. Para tornar possível a seleção da camada, clique no ícone cadeado novamente. Se uma ou mais camadas tiver a propriedade Bloqueado selecionada, o ícone cadeado aparece na barra de status.

NOTA: Também pode-se mudar estas propriedades, usando o diálogo Camadas.


Barra de ferramenta Controles da visualização

A barra de ferramentas Controles da visualização fornece ferramentas de navegação para auxiliar a visualização da janela principal de gráficos.

Os seguintes botões funcionam num modo adesivo. Um modo Adesivo quer dizer que o cursor permanece como a ferramenta selecionada até que uma ferramenta diferente seja selecionada, clicando em outro botão:

Ferramenta	Selecione-a para …
	mudar o modo de seleção
	mudar o centro da área do zoom
	amplia 2 vezes
	diminui 2 vezes

As seguintes ferramentas não são adesivas. Elas executam uma operação cada vez que são selecionadas:

Ferramenta	Selecione-a para …
	fazer um zoom para as extensões do modelo
	fazer um zoom para as configurações anteriores
	Ativar ou desativar a barra do Projeto
	exibir linhas de grid na janela de gráficos (também pode-se escolher esta configuração no diálogo Opções da visualização).


Barra de ferramentas Visualizações

Use as ferramentas da barra de ferramentas Visualizações para fazer o seguinte:

Esta ferramenta …	Passa para esta visualização …
	Levantamento
	Plano


    Barra de ferramentas Filtros

A barra de ferramentas Filtros está disponível na visualização Levantamento. Ela contém as ferramentas Visualizar filtros e Linha de tempo

Ferramenta	Selecione-a para …
	determinar as observações que devem ser exibidas ou como elas devem aparecer na visualização do Levantamento.
	abrir a janela da Linha de tempo
	conectar as observações da janela de gráficos e Linha de tempo. Ao selecionar esta ferramenta, o software somente exibe as linhas de base pós processadas que foram observadas no mesmo tempo. Todas outras linhas de base pós-processadas da visualização do levantamento são ocultas. Isso é uma ferramenta útil para seleção de linhas de base independentes.


    Barra de ferramentas Camadas

A barra de ferramentas Camadas é disponível na visualização do Plano. Ela contém a ferramenta Editar camadas e a ferramenta Seleção de camadas. Use esta barra de ferramentas para administrar as camadas.


    Comando Código da Característica do Processo

Use este comando para processar códigos de característica.

Para acessá-lo, selecione Ferramentas / Código da Característica do Processo.

Aparece o diálogo Código da Característica do Processo.


    Diálogo Código da Característica do Processo

Perspectiva geral
Use este diálogo para processar códigos de característica.

Para acessá-lo, selecione Ferramentas / Códigos da Característica do Processo.

Biblioteca de Características e Atributos

Selecione a biblioteca de características e atributos com a qual deseja processar dados.

Procurar

Clique Procurar para localizar a biblioteca de características e atributos.

NOTA: No Trimble Geomatics Office, todas as bibliotecas de características e atributos são do tipo de arquivo .fcl. Se você selecionar uma biblioteca de características e atributos do sistema TRIMMAP ou um sistema SDRmap, isso converte automaticamente aquela biblioteca de carcterísticas e atributos para um tipo de arquivo.fcl.

Por exemplo, se você selecionar um arquivo ‘Fclib??.dat’ (que o nome de arquivo padrão da biblioteca de códigos de característica de um sistema TRIMMAP ou de um sistema SDRmap), quando se processa esta biblioteca, o Trimble Geomatics Office lhe pede se deseja converter a biblioteca. O sistema também pergunta por um nome com o qual deve salvar a biblioteca. O nome padrão sugerido segue o padrão Fclib??.fcl e isso é armazenado por padrão na pasta do sistema.

Se o Trimble Geomatics Office encontrar qualquer definição de código que não possa converter, ele avisa-lhe de que a biblioteca resultante necessita ser revisada. Se erros forem encontrados, o sistema produz um relatório.

Processo

Códigos de característica são processados na ordem na qual foram selecionados.

Selecione a opção Seleção atual para processar as entidades atualmente selecionadas.

Escolha a opção Grupo de seleção e escolha um grupo de seleção da lista para processar.

A opção Seleção atual não é disponível se não houver um grupo de seleção disponível.

OK

Clique OK para processar códigos de características.

A biblioteca é processada e os resultados da codificação de característica aparecem na janela de gráficos. Se acontecer qualquer erro durante o processamento, pode-se visualizar um relatório do erro. Para encontrar onde os erros ocorrem, leia o relatório. O relatório é mantido na pasta de Relatórios para o projeto para poder ser visualizado mais tarde.


Trimble RoadLink - Perspectiva geral

O Trimble RoadLink™ é uma utilidade do Trimble Geomatics Office. É uma potente interface entre as definições de estrada de outras companhias e os dispositivos de levantamento da Trimble.

Use-o para:

  inserir dados

  visualizar dados graficamente

  editar dados

Pode-se então transferir a definição de estrada para os dispositivos de levantamento da Trimble para uso durante a piquetagem.

O Trimble RoadLink fornece duas maneiras de transferir definições de estrada:

  Conversão automatizada de arquivos (alinhamento horizontal e vertical e seção transversal) fornecida por software de desenho terceiro

  Entrada manual da definição de estrada, incluindo alinhamentos horizontal e vertical, gabaritos e superelevação

Um componente integral do Trimble Geomatics Office, o RoadLink também calcula volumes de corte e preenchimento para terraplangens entre a definição da estrada e o modelo de superfície definidos no utilitário DTMLink da Trimble.


Trimble DTMLink - Noções  Gerais

O Trimble DTMLink™ é uma utilidade do software Esta utilidade cria superfícies digitais do terreno. Com este software pode-se importar superfícies definidas por um software terceiro, criar novas superfícies e editar as superfícies criadas anteriormente. Também pode-se transferir estas superfícies para um dispositivo de levantamento da Trimble para uso no campo.

O software possui a capacidade de incluir limites e linhas de interrupção no modelo de superfície do contorno e permite características de edição de triângulo avançado para fornecer maior controle na formação do modelo.

Um Modelo Digital de Terreno quadriculado ou triangulado é criado a partir do modelo de superfície do contorno para exportar para um dispositivo ou arquivo de dados.

O modelo criado também pode ser usado pelo software Trimble RoadLink™ para cálculos de terraplanagem.

O DTMLink da Trimble lhe permite criar relatórios de volumes.

Aplicações típicas para cálculos de volume são:

  cálculos de reservas

  volumes de camadas de materiais, tal como veios carboníferos

  volumes de vazios, tais como lagos atrás de diques propostos

O DTMLink usa o método de computação de volumes de particulares prismas triangulares. Eles são definidos pelos planos triangulares formando o modelo de superfície de contorno através do uso de áreas de base e alturas médias de prismas.

O DTMLink lhe permite criar superfícies para comparação. Uma superfície de comparação é um modelo de contorno da diferença entre duas superfícies. Pode-se usar esta superfície em conjunto com o tipo de cálculo de volume ‘Acima de um elevação’ para calcular os volumes de corte e preenchimento entre as duas superfícies.


    Comando Iniciar

Este comando inicia o utilitário DTMLink™ da Trimble.

Para acessá-lo:

•	Selecione Ferramentas / DTMLink / Start.

Use este comando para que o DTMLink comece a importar um arquivo AutoCAD DXF com faces 3D sem criar uma nova superfície ou abrir uma superfície existente.

Para fazê-lo:

1.	Selecione Ferramentas / DTMLink / Iniciar.

2.	Selecione Arquivo / Importar.

Para maiores informações, consulte a Ajuda do DTMLink.


    Comando Nova Superfície

Use este comando para criar um novo modelo de superfície.

Para acessá-lo, selecione Ferramentas / DTMLink / Nova Superfície.

Aparece o diálogo Nova Superfície.


    Diálogo Nova Superfície

Use este diálogo para criar um novo modelo de superfície.

Para acessá-lo, selecione Ferramentas / DTMLink / Nova Superfície.

Nome

Insira um nome apropriado para a nova superfície.

Pontos

A opções Pontos lhe permite selecionar quais os pontos do banco de dados do projeto devem ser usados para a informação da superfície.

  Se não houver uma atual seleção atual do banco de dados, a opção Seleção atual não será disponível.

  Quando houver uma seleção atual, a opção Seleção atual usa os pontos da seleção atual para a formação da superfície.

A opção Todo o banco de dados usa todos os pontos do banco de dados para a formação da superfície.

A opção Grupo de seleção lhe permite escolher um grupo de seleção existente, que mantém os pontos que você deseja usar para formar a superfície.

Usar linhas de separação

As opções de Usar linhas de separação lhe permitem selecionar um trabalho de linha do banco de dados que deve ser usado como linhas de separação quando a superfície é formada.

Linhas de interrupção, em termos de formação do modelo de superfície, são linhas que devem ser consideradas como tendo um grau constante e assim assistem o controle da formação do modelo.

Estas opções somente são disponíveis se a opção Usar linhas de separação estiver selecionado. Usar linhas de separação deve estar selecionado para toda informação sobre a linha de separação a ser passada à operação da formação da superfície.

A opção Grupo de seleção lhe permite usar o trabalho de linha de um grupo de seleção existente configurado como linhas de separação durante a formação da superfície. A opção Camada lhe permite usar o trabalho de linha de uma camada existente como linhas de separação durante a formação da superfície. Em ambos casos a caixa associada fornece listas de grupos de seleção e camadas disponíveis.

Usar excluir limites

As opções Usar excluir limites operam da mesma maneira que as opções Usar linhas de separação acima. Estas opções habilitam-no especificar que o trabalho de linha existente seja num grupo de seleção ou numa camada, deve ser usada para a definição de um ou mais limites excluídos durante a formação do modelo de superfície.

Excluir limites é um grupo de linhas que definem uma figura fechada dentro da qual nenhum triângulo de superfície será formado. Se a linha de trabalho especificada para a definição de excluir limites não formar figuras totalmente fechadas, a operação de formação do modelo de superfície adiciona linhas padrão de fechamento.

Usar incluir limites

As opções de Usar incluir limites funcionam da mesma maneira que as opções Usar excluir limites acima. Estas opções lhe permitem especificar que o trabalho de linha existente seja num grupo de seleção ou numa camada, deve ser usado para a definição de um ou mais limites incluídos durante a formação do modelo de superfície.

Incluir limites é um grupo de linhas que definem uma figura fechada dentro da qual os triângulos da superfície devem ser formados. Nenhum triângulo é formado fora de qualquer incluir limites definidos. Se o trabalho de linha especificado para a definição de incluir limites não formar figuras totalmente fechadas, a operação de formação do modelo da superfície adiciona linhas de fechamento padrão.

NOTA: O trabalho de linha usado para Linhas de separação, Excluir limites e Incluir limites podem incluir arcos e curvas. Nestes casos o DTMLink interpreta os arcos ou curvas como séries de segmentos curtos de linha reta para serem usados na formação de triângulos. O software garante que nenhum segmento de linha esteja separado por mais de dois centímetros da linha do arco ou curva.

Para maiores informações sobre os limites e linhas de separação, consulte a Ajuda online do DTMLink da Trimble.


    Comando Superfície Existente

Use este comando para editar um modelo de superfície existente.

Para acessá-lo, selecione Ferramentas / DTMLink / Superfície Existente.

Aparece o diálogo Superfície Existente.


    Diálogo Superfície Existente

Use este diálogo para editar um modelo de superfície existente. Este diálogo lhe permite especificar pontos e trabalho de linha do projeto que deseja adicionar a uma superfície existente.

Para acessá-lo, selecione Ferramentas / DTMLink / Superfície Existente.

NOTA: Se você especificar pontos e trabalho de linha neste diálogo que já estejam na superfície existente, o sistema reconhece isso e nos os adiciona na superfície mais uma vez.

Nome

Este campo apresenta uma lista de superfícies existentes no projeto. Selecione a superfície que deseja editar.

Adicionar pontos

Selecione os pontos do banco de dados do projeto que devem ser adicionados à superfície existente.

Se não houver uma seleção atual do banco de dados, a opção Seleção atual não será disponível.

Quando houver uma seleção atual, a opção Seleção atual adiciona os pontos na seleção atual à superfície existente.

A opção Todo o banco de dados passa todos os pontos atualmente presentes no banco de dados para o modelo da superfície. Isso lhe permite adicionar ao modelo todos pontos novos do banco de dados.

A opção Grupo de seleção lhe permite escolher um grupo de seleção existente que mantém os pontos que deseja adicionar à superfície existente.

Adicionar linhas de interrupção

As opções Adicionar linhas de interrupção lhe permite selecionar um trabalho de linha do banco de dados que deve ser adicionado às linhas de interrupção já presentes na superfície existente. Estas opções somente são disponíveis se a opção Adicionar linhas de interrupção estiver selecionada.

A opção Adicionar linhas de interrupção deve ser selecionada para toda informação de linha de interrupção a ser adicionada à superfície existente. Linhas de interrupção, em termos de formação do modelo da superfície, são linhas que devem ser consideradas como tendo um grau constante e assistindo o controle da formação do modelo.

A opção Grupo de seleção lhe permite adicionar o trabalho de linha de um grupo de seleção existente à superfície existente com linhas de interrupção.

A opção Camada lhe permite adicionar o trabalho de linha de uma camada existente para a superfície existente como linhas de interrupção.

Em ambos as listas mostram os grupos de seleção e camadas disponíveis.

Adicionar Excluir Limites

As opções Adicionar excluir limites funcionam da mesma maneira que as opções de Adicionar linhas de interrupção, como especificado acima.

Estas opções lhe permitem especificar que a linha de trabalho existente seja no grupo de seleção ou na camada deve ser adicionada como linhas excluir limites para a definição de excluir limites na superfície existente.

Uma excluir limite é um grupo de linhas que definem uma figura fechada dentro da qual nenhum triângulo de superfície será formado.

Se o trabalho de linha especificado para a definição de excluir limites não formar figuras totalmente fechadas, a operação da formação do modelo da superfície adiciona linhas padrão de fechamento.

Adicionar Incluir Limites

As opções de Adicionar Incluir Limites operam da mesma maneira das opções Adicionar Excluir Limites como especificado acima.

Estas opções lhe permitem especificar que a linha de trabalho existente seja no grupo de seleção ou na camada deve ser adicionada como linhas incluir limites para a definição de incluir limites na superfície existente.

Uma incluir limite é um grupo de linhas que definem  uma figura fechada dentro da qual os triângulos da superfície devem ser formados. Nenhum triângulo será formado fora de qualquer limite incluído definido.

Se o trabalho de linha especificado para a definição de incluir limites não formar figuras totalmente fechadas, a operação da formação do modelo da superfície adiciona linha de padrão de fechamento.

NOTA: O trabalho da linha usado para linhas de interrupção, Excluir limites e Incluir limites podem incluir arcos e curvas. Nestes casos o DTMLink interpreta os arcos ou curvas séries de segmentos curtos de linha reta para serem usados na formação de triângulos. O software garante que nenhum segmento de linha esteja separado por mais de dois centímetros da linha do arco ou curva.

Para maiores informações sobre os limites e linhas de separação, consulte a Ajuda online do DTMLink.


    Comando Iniciar

Este comando inicia o utilitário RoadLink da Trimble. Use este software para importar ou inserir manualmente definições de estrada para transferir para dispositivos de levantamento da Trimble para fins de piquetagem.

Para acessá-lo:

•	Selecione Ferramentas / RoadLink / Iniciar.


    Comando Exportar

Use este comando para exportar pontos de um grupo de seleção, todo o banco de dados ou seleção atual para o RoadLink.

Para acessá-lo:

•	Selecione Ferramentas / RoadLink / Exportar.

Aparece o diálogo Exportar.


    Diálogo Exportar

Use este diálogo para exportar pontos de um grupo de seleção, todo o banco de dados ou seleção atual para o RoadLink. A apresentação de pontos existentes do banco de dados do RoadLink pode auxiliar na entrada ou verificação de uma definição de estrada.

Para acessá-lo:

•	Selecione Ferramentas / RoadLink / Exportar.

Pontos

Selecionar o grupo de pontos.

São disponíveis três opções:

Seleção atual	Exporta pontos selecionados
Todos o banco de dados	Exporta todos os pontos do banco de dados
Grupo de seleção	Escolha o grupo de seleção da lista.

Para maiores informações consulte a Ajuda do RoadLink.


Marcas Comerciais

O logotipo do Globo com a palavra Trimble, a Trimble, DTMLink, GPSurvey, RoadLink, Trimble Geomatics Office, Trimble Survey Controller, Trimble Survey Office, Trimble Total Control, TRIMMAP, TRIMNET, TSC1 e TSCe são marcas comerciais da Trimble Navigation Limited.

O logotipo que ilustra o sextante com a palavra Trimble, o Geodimetro e o GPS Pathfinder, são marcas comerciais da Trimble Navigation Limited, registradas no Departamento de Marcas Registradas e Patentes dos Estados Unidos.

Todas outras marcas comerciais são propriedades dos seus respectivos donos.

Standard Template Library, © 1994 Hewlett-Packard Company, Standard Template Library, © 1996,97 Silicon Graphics Computer Systems, Inc., Standard Template Library, © 1997 Moscow Center for SPARC Technology.


Comando Compactar e reparar projeto

Use este comando para compactar e reparar o banco de dados do seu projeto.

Para acessá-lo:

  Selecione Utilidades / Compactar e reparar projeto.

O diálogo Compactar e reparar projeto abre-se.


Comando Compactar e reparar projeto

Use este diálogo para compactar e reparar o banco de dados do seu projeto.

Compactar

A compactação economiza espaço do disco rígido e melhora a produtividade do software. É bom compactar regularmente o banco de dados do projeto.

Reparar

O banco de dados pode ser danificado se, por exemplo, a corrente de energia for interrompida durante a execução do Trimble Geomatics Office.

Se o Trimble Geomatics Office desliga inesperadamente durante a edição do banco de dados, a última mudança feita nos dados pode ser perdida depois do conserto do banco de dados. Será necessário reabrir o projeto, voltar para onde se estava editando e verificar se as mudanças foram salvadas.

Para usar o diálogo Compactar e reparar projeto:

1.	Selecione Utilidades / Compactar e reparar projeto.

2.	Selecione o projeto que deseja compactar e reparar.

Se o banco de dados do projeto não pode ser compactado ou reparado, aparece uma mensagem de erro.

SUGESTÃO: Se o disco rígido estiver demasiado fragmentado, desfragmente-o antes de compactar o banco de dados.


Utilidade do Trimble Geomatics Office

As seguintes utilidades do Trimble Geomatics Office são disponíveis com a opção Instalação típica do Trimble Geomatics Office:

Utilidade Coordinate System Manager™ da Trimble

Utilidade Convert to RINEX™ da Trimble

Utilidade Data Transfer da Trimble

Utilidade DC File Editor™ da Trimble

Utilidade Feature and Attribute Editor™ da Trimble

Utilidade Line Type Editor™ da Trimble

Utilidade Planning

Utilidade Symbol Editor™ da Trimble

Utilidade A1 Viewer da Trimble

NOTA: A Utilidade Grid Factory™ da Trimble é disponível na opção Instalação personalizada.

Para maiores informações, consulte o Manual do Usuário do Trimble Geomatics Office.

Adicionando Utilidades

Para adicionar mais utilidades ao menu Utilidades:

1.	Use o Microsoft Windows Explorer para encontrar ...\Arquivos do Programa\Trimble\Trimble Geomatics Office\Utilidade.

2.	Clique o lado direito do mouse numa parte limpa da janela direita do Explorer.

3.	Selecione a opção Novo / Atalho.

Isso abre o assistente de Criar atalho.

4.	Para configura o atalho, insira o caminho para a utilidade que deseja adicionar ao menu Utilidades.

5.	Clique Próximo e preencha o campo ‘Selecionar um nome para o atalho’ para definir o nome para a utilidade que deseja exibir no menu Utilidades.

A próxima vez que executar o Trimble Geomatics Office, a utilidade para o atalho adicionado aparece no menu Utilidades.


Symbol Editor

A utilidade Symbol Editor™ da Trimble lhe permite editar bibliotecas de símbolos de ponto (*.sym) usadas pelo Trimble Geomatics Office.

Para acessá-la, escolha uma das seguintes opções:

  Selecione Utilidades / Symbol Editor quando nenhum projeto está aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

Para criar ou modificar símbolos existentes de ponto, use esta utilidade. Uma vez que registrar o arquivo editado como arquivo do sistema, os símbolos criados são os símbolos disponíveis quando se adicionam ou modificam estilos de ponto no Trimble Geomatics Office ou na utilidade Feature and Attribute Editor da Trimble.

Um estilo de ponto

  é uma definição que explica como um ponto é desenhado no Trimble Geomatics Office

  inclui um símbolo que foi criado na utilidade Symbol Editor.

A criação de um símbolo na utilidade Symbol Editor não torna disponível o símbolo automaticamente como um estilo de ponto no Trimble Geomatics Office. Um ponto recebe um estilo de ponto, não um símbolo. Um estilo de ponto deve ser definido usando o símbolo apenas criado.

A utilidade Symbol Editor abre automaticamente  com a biblioteca de símbolos atual em uso pelo Trimble Geomatics Office. Os nomes dos símbolos da biblioteca aberta são apresentados numa lista na tela. Use esta lista para selecionar o símbolo que deseje editar.

Pode-se executar o editor independentemente do Trimble Geomatics Office. Selecione o ícone de atalho da utilidade Symbol Editor na pasta do software Trimble Geomatics Office.

NOTA: Ao executar o editor independentemente do Trimble Geomatics Office, nenhuma mudança feita no atual tipo de símbolo será refletida em qualquer dos projetos atualmente abertos. Para visualizar estas mudanças aplicadas, feche e volte a abrir o projeto. As mudanças salvadas tornam-se disponíveis na biblioteca de Símbolos.

Para maiores informações, consulte a ajuda da utilidade Symbol Editor da Trimble.


Line Type Editor

A utilidade Line Type Editor™ da Trimble lhe permite editar bibliotecas de tipos de linha (*.ltp) usadas pelo Trimble Geomatics Office.

Para acessá-la, escolha uma das seguintes opções:

  Selecione Utilidades / Line Type Editor quando nenhum projeto está aberto.

  Selecione a partir do menu Iniciar no Microsoft Windows a qualquer momento.

Para criar ou modificar tipos de linhas existentes, use esta utilidade. Uma vez que registrar o arquivo editado como arquivo do sistema, os tipos de linha criados são os tipos de linha disponíveis quando se adiciona ou modifica estilos de linha no Trimble Geomatics Office ou na utilidade Feature and Attribute.

Um estilo linha

  é uma definição que explica como uma linha é desenhada no Trimble Geomatics Office

  inclui um tipo de linha criado na utilidade Line Type Editor.

A criação de um tipo de linha na utilidade Line Type Editor não o torna disponível como um tipo de linha automaticamente no Trimble Geomatics Office. Uma linha recebe um estilo de linha. Um estilo de linha deve ser definido usando o símbolo apenas criado.

A utilidade Line Type Editor abre automaticamente com a biblioteca de símbolos atual em uso pelo Trimble Geomatics Office. Os nomes dos tipos de linhas da biblioteca aberta são apresentados numa lista na tela. Para editar tipos de linhas, use esta lista.

Pode-se executar o editor independentemente do Trimble Geomatics Office. Selecione o ícone de atalho da utilidade Line Type Editor na pasta do Trimble Geomatics Office.

NOTA: Ao executar o editor independentemente do Trimble Geomatics Office, nenhuma mudança feita na biblioteca de tipos de linha do sistema será refletida no projeto atual. Para visualizar estas mudanças aplicadas, feche e volte a abrir o projeto depois de ter salvado as mudanças da biblioteca do tipo de linha. As mudanças salvadas tornam-se disponíveis na biblioteca de tipos de linhas.

Para maiores informações, consulte a ajuda da utilidade Line Type Editor da Trimble.


Grid Factory

Para instalar a utilidade Grid Factory™ da Trimble, use a opção de instalação personalizada.

Para acessá-la uma vez que esteja instalada, escolha uma das seguintes opções:

  Selecione Utilidades / Grid Factory quando o projeto estiver aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

Use a utilidade Grid Factory da Trimble para trabalhar com arquivos do Grid do datum (*.dgf) e Grid do geóide (*.ggf).

Use esta utilidades para criar sub-grids de grids existentes ou para combinar múltiplos grids existentes num só grid. Os arquivos de grid do datum podem ser subdivididos em sub-grids, usando o Trimble Geomatics Office.

Se usar a utilidade Grid Factory para criar arquivos de grid do geóide, tenha certeza de que o nome inserido para o novo arquivo é o mesmo do modelo geóide criado na utilidade Coordinate System Manager™ da Trimble.

Os grids serão grandes quando as áreas geográficas cobertas forem grandes.

Por exemplo, o grid do geóide OSU91 é de aproximadamente 2 Mb. Coletores de dados e receptores geralmente não têm memória suficiente para armazenar esta quantidade de dados. O grid OSU91 cobre todo o globo, mas as a maioria dos agrimensores não necessitam cobertura tão grande. Geralmente os agrimensores somente necessitam algumas dezenas ou centenas de quilômetros quadrados. Um grid que cubra uma área menor geralmente é de somente algumas centenas de bytes.

Com a utilidade Grid Factory é possível criar arquivos de com grid subdivididos do modelo geóide que cubram áreas locais. Estes arquivos são pequenos o suficiente para serem baixados no dispositivo Trimble Survey Controller (versão 6 ou mais recente) para uso na área local.

Muitos produtos da Trimble são fornecidos com arquivos de grid para conversão do datum e modelagem do geóide que pode ser usado na utilidade Grid Factory. A utilidade Grid Factory também importa arquivos de grid estrangeiros e os converte para o formato de grid da Trimble.

Para maiores informações, veja a Ajuda da utilidade Grid Factory da Trimble.


DC File Editor

A utilidade DC File Editor™ da Trimble lhe permite editar arquivos do Survey Controller (*.dc).

Para acessá-la, escolha uma das seguintes opções:

  Selecione Utilidades / DC File Editor quando nenhum projeto está aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

NOTA: A Trimble recomenda que se faça toda a edição no Trimble Geomatics Office. Isso garante que sempre se tem o arquivo original do coletor de dados ao qual voltar se ocorrer algum problema durante a edição no Trimble Geomatics Office.

Use a utilidade DC File Editor da Trimble para editar arquivos dos seguintes dispositivos:

  Trimble

  Sokkia SDR (até a versão 4-03)

  Qualquer arquivo de dispositivo que possa ser convertido para o formato SDR

Para editar o conteúdo de um arquivo .dc, use a utilidade DC File Editor da Trimble. Por exemplo, pode-se mudar, erroneamente, dados coletados no campo ou adicionar informações que não estava disponível no campo.

NOTA: Não é possível editar atributos ou mudar as informações da biblioteca de características e atributos.

Para maiores informações, consulte a Ajuda da utilidade DC File Editor da Trimble.


Feature and Attribute Editor

Use a utilidade Trimble Feature and Attribute Editor™ para gerenciar os arquivos da biblioteca de características e atributos (*.fcl) para o processamento de código de característica e coleta de dados GIS.

Para acessá-la, escolha uma das seguintes opções:

  Selecione Utilidades / Feature and Attribute Editor quando nenhum projeto está aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

Use a utilidade Trimble Feature and Attribute Editor para visualizar ou editar arquivos da biblioteca de características e atributos. Um biblioteca de características e atributos é usada para:

  processar códigos de características

  coleta de atributos

Um arquivo de texto .fcl é um arquivo de texto que contém as definições de características, estilos CAD e códigos de controle. Uma definição de característica pode incluir:

  um código para a característica

  os procedimentos CAD a serem efetuados em pontos que possuem aquela características associados a eles

  os atributos requeridos para a característica

Pode-se criar novas bibliotecas de características e atributos. Também pode-se usar a biblioteca padrão de características e atributos do Trimble Geomatics Office na sua forma atual ou modificar a biblioteca para melhor condizer com seus requerimentos.

Para maiores informações, consulte a Ajuda da utilidade Feature and Attribute Editor da Trimble.


Coordinate System Manager

A utilidade Coordinate System Manager™ da Trimble lhe dá acesso ao seu banco de dados do sistema de coordenadas (Atual.csd).

Para acessá-la, escolha uma das seguintes opções:

  Selecione Utilidades / Coordinate System Manager quando o projeto está aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

Com a utilidade Coordinate System Manager da Trimble, pode-se definiar novos:

  parâmetros do elipsóide

  transformações do datum

  sistemas de coordenadas

  definições do local

  modelos do geóide

NOTA: A maioria dos usuários não necessitam usar a utilidade Coordinate System Manager da Trimble porque a Trimble forneceu um grupo extensivo de definições predefinidas do sistema de coordenadas. Somente use a utilidade Coordinate System Manager da Trimble se desejar adicionar uma definição nova ao sistema de coordenadas.

O Trimble Geomatics Office usa o banco de dados do sistema de coordenadas para determinar quais sistemas de coordenadas, modelos geóide e sites são disponíveis para seleção num projeto.

NOTA: Locais podem ser criados no Trimble Geomatics Office ou na utilidade Coordinate System Manager e são armazenados no banco de dados geodésico.

Para maiores informações, consulte a Ajuda da utilidade Coordinate System Manager da Trimble ou o Manual do Usuário do Trimble Geomatics Office.


Planning

A utilidade Panning da Trimble auxilia no planejamento e programação de sessões GPS de campo. Use esta utilidade antes de planejar sessões de GPS para determinar as condições apropriadas para o levantamento GPS.

Para acessar a utilidade Planning, escolha uma das seguintes opções:

  Selecione Utilidades / Planning quando nenhum projeto está aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

O planejamento da missão é geralmente a primeira fase do gerenciamento de um projeto de levantamento. O objetivo é definir todos aspectos significativos do projeto, de modo que possa ser executado com eficiência e eficácia sob todas possíveis condições. Se estiver fazendo levantamentos cinemáticos em tempo real (RTK):

  Use a utilidade Planning para verificar se ao menos quatro satélites serão disponíveis para obter uma inicialização de ponto conhecido e se cinco satélites serão disponíveis para obter uma inicialização em movimento.

  Inspecione os valores de Diluição da Precisão da Posição (PDOP) para confirmar se as condições geométricas dos satélites são apropriadas para um posicionamento preciso em tempo real.

NOTA: A utilidade Planning não está diretamente relacionada a um projeto do software Trimble Geomatics Office e não armazena descrições da sessão. Pode-se definir sessões e usá-las durante a mesma execução do programa.

A utilidade Planning pode auxiliá-lo:

  visualizar e predizer a disponibilidade de satélites através de tabelas e representações gráficas

  experimentar seleções de satélite, almanaques, fusos horários, obstruções de visibilidade do local e máscaras de elevações

  determinar os melhores períodos de observação para um sessão, dadas as necessárias coações na PDOP e nos horários durante os quais o pessoal do campo pode trabalhar

Para maiores informações, consulte a Ajuda da utilidade Planning.


Convert to RINEX

O formato “Receiver INdependent Exchange” (RINEX) é uma representação ASCII dos dados GPS coletados por receptores. A utilidade Convert to RINEX converte um arquivo do formato binário .dat coletado por receptores de levantamento da Trimble para arquivos do formato ASCII RINEX. Pode-se executar a utilidade independentemente do Trimble Geomatics Office.

Para acessar a utilidade Convert to RINEX, escolha uma das seguintes opções:

  Selecione Utilidades / Convert to RINEX quando nenhum projeto está aberto.

  Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

Use a utilidade para:

  selecionar arquivos para conversão

  configurar os parâmetros da conversão

  configurar as informações do arquivo de saída para antenas e cabeçalhos

  converter os arquivos selecionados para o formato RINEX

A utilidade Convert to RINEX pode criar três tipos de arquivos RINEX:

  Observação (observações GPS não processadas com informações da antena da estação)

  Navegação (órbitas GPS)

  Meteorológicos (pressão, temperatura e umidade relativa)

A utilidade cria arquivos RINEX de Observação e Navagação por padrão. Também pode-se optar por criar um arquivo RINEX Meteorológico.

Para maiores informações, consulte a Ajuda on-line da utilidade Convert to RINEX da Trimble.


A1 Viewer

A utilidade A1 lhe permite visualizar o conteúdo de um arquivo do projeto GPSurvey (*.A1), e extrair (salvar) arquivos selecionados para um diretório de destino. A utilidade A1 Viewer funciona independentemente do GPSurvey, portanto, não há necessidade de carregar este software no seu computador. Depois de salvar os arquivos do projeto GPSurvey, pode-se usar as funções de importação no Trimble Geomatics Office para importar os dados para um projeto atual.

Para acessar a utilidade A1 Viewer, escolha uma das seguintes opções:

 Selecione Utilidades / A1 Viewer quando nenhum projeto estiver aberto.

 Selecione a partir do menu Iniciar do Microsoft Windows a qualquer momento.

Importador de Coordenadas GPSurvey

A opção Importador de Coordenadas GPSurvey (Coordenadas GPSurvey [curr_net.dat] ) lhe permite importar coordenadas ajustadas de um arquivo Curr_net.dat. Para acessar este software:

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Na guia Levantamento, selecione Coordenadas GPSurvey (curr_net.dat) e clique OK. Aparece o diálogo Abrir.

NOTA: O arquivo deve ter o nome de curr_net.dat para que possa ser efetivamente importado.

3.	Navegue para o arquivo e clique OK.

Agora pode-se importar coordenadas ajustadas de um arquivo Curr_net.dat.

Arquivos suportados pela utilidade A1 Viewer

Somente os arquivos que foram obtidos pelo GPSurvey são disponíveis para visualização:

  arquivos .ssf/.ssk – estes arquivos contêm os resultados da solução da linha de base do processador WAVE do GPSurvey. Eles são importados para um projeto do Trimble Geomatics Office utilizando o formato de importação de arquivos SSF/SSK (*.ssf,*.ssf), que é disponível na guia Levantamento do diálogo Importar.

  Arquivos de dados GPS – estes arquivos contêm os dados GPS não processados que foram coletados no campo. Os dois tipos de arquivos—*.dat (arquivos de dados GPS não processados de um receptor da Trimble) e *.rnx (arquivos de dados RINEX não processados convertidos para serem usados no processador WAVE)—estão disponíveis quando se seleciona este filtro. Novamente, ambos tipos de arquivos (.dat e .rnx) são importados para um projeto usando o formato de importação de arquivos GPS Data (*.dat).

NOTA: Para visualizar os arquivos *.rnx disponíveis do diálogo do arquivo Abrir do formato de importação de arquivos Dados GPS, no campo Arquivos do tipo, selecione Todos arquivos *.*.

  Arquivos de coordenadas ajustadas – estes arquivos, Curr_net.dat e Coords.log, contêm as coordenadas ajustadas de um projeto obtido do GPSurvey. O arquivo Curr_net.dat é usado para importar suas coordenadas para o Trimble Geomatics Office. O arquivo Coords.log é do formato ASCII e somente está disponível para visualização com um editor de textos. Os pontos do Projeto GPSurvey podem ser do formato geográfico ou de grid e em qualquer sistema de coordenadas. Para que a importação de coordenadas possa funcionar corretamente, o sistema de coordenadas as propriedades do sistema de coordenadas do projeto Trimble Geomatics Office devem condizer exatamente com as propriedades do sistema de coordenadas do projeto GPSurvey.

O arquivo (Curr_net.dat) é importado para um projeto usando o formato de importação de Coordenadas GPSurvey (Curr_net.dat). Quando o arquivo (Curr_net.dat) é lido, o software identifica quais as coordenadas foram Fixadas durante o ajuste do GPSurvey. Deve haver ao menos um componente fixo de coordenada (NE, e, h) no arquivo antes que todos componentes de coordenadas do mesmo tipo sejam importados. Por exemplo, uma elevação fixa é requerida antes que as elevações sejam importadas. Todos componentes importados recebem uma qualidade de controle.

  arquivos .ggf – estes arquivos contêm os dados de geóide dos arquivos locais Geoid Grid (*.ggf) criados em, ou importados para, um projeto do GPSurvey. Eles são criados usando a função da Modelagem do Geóide Residual no TRIMNet Plus. Este filtro não exibirá os arquivos Global .ggf (isto é, WW15MGH, GEOID99) que estavam disponíveis no software GPSurvey. Para usar o arquivo .ggf no Trimble Geomatics Office, salve o arquivo .ggf na pasta Arquivos do Programa\Arquivos Comuns\Trimble\GeoData, e use então a utilidade Coordinate System Manager para adicionar o geóide ao banco de dados do sistema de coordenadas. Para maiores informações sobre como usar esta utilidade, consulte a Ajuda da utilidade Coordinate System Manager.

Usando o modo One-Height do TRIMNet Plus

Quando se está importando coordenadas GPSurvey de um projeto utilizando o modo One-Height no TRIMNet Plus, o campo Altura do projeto Trimble Geomatics Office contém o valor da elevação. Isso porque, durante um ajuste do modo One-Height, o TRIMNet Plus usa o campo Altura do elipsóide para a elevação (altura ortométrica). Se não se sabe que modo foi usado para um projeto GPSurvey, abra o projeto no GPSurvey e verifique as configurações especiais de controle no TRIMNet Plus.

Usando informações precisas de efeméride

A função de arquivo de projeto do GPSurvey não arquivará informações precisas de efeméride durante o processamento de linha de base no software WAVE. Se as informações precisas de efeméride foram usadas durante o processamento da linha de base no projeto GPSurvey, deve-se importá-lo para o Trimble Geomatics Office a partir da fonte original.


Modelos de Antena NGS

Pode-se usar um dos dois grupos de modelo de antena—Trimble ou NGS— com o Trimble Geomatics Office. Os seus requerimentos de levantamento determinam o grupo de modelo da antena que deve ser usado. Geralmente se usa o grupo de modelo de antena NGS quando se usam diferentes tipos de antena daqueles definidos em Antenna.ini.

O grupo de antenas da Trimble é instalado como padrão. No entanto, para instalar os modelos de antena NGS, na guia Global do diálogo Estilos de processamento da linha de base GPS, selecione a opção NGS da lista de Modelos de antena.


  Comando Visualização do levantamento

Use este comando para visualizar o projeto na Visualização do levantamento.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Levantamento.

  Selecione a ferramenta Visualização do levantamento.


  Visualização do levantamento - Perspectiva geral

 Ver também

Pode-se ver um projeto na Visualização do levantamento ou na visualização do plano.

Use a Visualização do levantamento para executar tarefas relacionadas a levantamentos, tais como:

  para verificar observações GPS e terrestres

  corrigir dados errados.

Algumas opções do menu e barras de ferramenta somente são disponíveis na Visualização do levantamento. Elas lhe permitem executar tarefas relacionadas a levantamentos, tais como processamento de linha de base e Ajuste da Rede.

SUGESTÃO: Para visualizar diferentes partes do projeto ao mesmo tempo, crie várias janelas. Para maiores informações, consulte o comando Nova Janela.

Visualização de dados de levantamento

Observações GPS e terrestres são apresentadas como linhas na Visualização de levantamento.

Clique duas vezes uma linha de observação para visualizar a observação que usa a janele Propriedades e edite a observação, se necessário. Aparecem sinalizadores de erros em pontos ou observações se houve um erro de fecho fora da tolerância ou uma observação GPS falha um critério de rejeição.

Diferentes cores de linha representam um diferente status derivado da configuração do Estilo da Legenda no diálogo Propriedades do Projeto / guia Relatando. Pontos de controle e pontos ajustados da rede também possuem apresentações especiais na Visualização do levantamento.

Tarefas disponíveis na Visualização do levantamento

As seguintes tarefas são somente disponíveis na Visualização do levantamento:

  Visualizar Filtros

  Selecionar Observações

  opções de relatório de fechamento do círculo GPS

Outras tarefas relacionadas ao levantamento são disponíveis com o módulo Processamento de Linha de Base e módulo Ajuste da Rede. As tabelas abaixo mostram as tarefas adicionais de cada módulo.

Módulo de Processamento da Linha de Base

Módulo de Ajuste da Rede

Mudando Visualizações

Pode-se mudar as visualizações quando se quer.

Para mudar para a Visualização do plano, faça um dentre o seguinte:

  Selecione a ferramenta Visualização do plano.

  Selecione Visualizar / Plano.


  Comando Visualização do plano

Use este comando para visualizar o projeto da Visualização do plano.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Plano.

  Selecione a ferramenta Visualizar plano.


    Visualização do plano - Perspectiva geral

Ver também

Pode-se visualizar um projeto na Visualização do plano ou na Visualização do levantamento.

Use a Visualização do plano para visualizar as características topográficas observadas durante o levantamento no campo.

Pode-se adicionar pontos, linhas, estilos e anotações para melhorar a apresentação do projeto. As mudanças feitas na Visualização do plano não afetam a base das observações do levantamento.

Algumas opções do menu e barras de ferramenta somente são disponíveis na Visualização do plano. Estas opções lhe permitem executar tarefas relacionadas ao CAD (tais como codificação da característica, controle da camada e gestão do estilo).

SUGESTÃO: para visualizar diferentes partes do projeto ao mesmo tempo, crie várias janelas. Para maiores informações, consulte o comando Nova Janela.

Entidades (pontos, linhas, curvas, arcos, texto e anotações) são apresentadas de acordo com o estilo dado a elas. Pode-se mudar o estilo de uma entidade através da codificação da característica ou através do uso da Janela propriedades. Observações GPS e convencionais não serão apresentadas. Se uma linha for adicionada na Visualização do plano, uma nova entidade estará sendo adicionada ao banco de dados.

Se for feita uma mudança para a Visualização do levantamento, as linhas CAD não aparecerão.

Uma vez que tenha completado as tarefas na Visualização do plano, pode-se imprimir ou exportar o plano para o pacote de software de desenho.

Tarefas disponíveis na Visualização do plano

As seguintes tarefas somente são disponíveis na Visualização do plano:

  Camadas

  Estilos (Ponto, Linha, Texto)

  Inserir pontos

  Inserir trabalho da linha

  Inserir texto

  Inserir anotações

  Inserir trabalho de linha para observações atuais

  Selecionar por Camadas

  Selecionar por Estilos

  Selecionar por Tipos

  Selecionar por característica de ponto

  Codificação da característica

  DTMLink

  RoadLink

Mudando a visualização

Pode-se mudar a visualização quando se quer.

Para mudar para a Visualização do levantamento, faça um dentre o seguinte:

  Selecione a ferramenta Visualização do levantamento.

  Selecione Visualizar / Levantamento.

  Pressione Alt+1.


Comando Ampliar

Use este comando para aumentar uma seção da janela de gráficos.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Zoom / Ampliar.

  Selecione a ferramenta Ampliar [image].

Se o Navegador do Zoom estiver apresentado, a área da visualização da janela gráfico é mostrada como um quadro preto na janela Navegador do Zoom.

Para usar a ferramenta Ampliar:

1.	Mova o apontador sobre a janela de gráficos.

O apontador em forma de lente de aumento aparece com um sinal de mais dentro. Fios cruzados sobre o apontador de lente de aumento marcam o ponto de interesse.

2.	Faça um dentre o seguinte:

  Clique sobre uma posição da janela gráficos para ampliar numa razão de dois, centrado no ponto de interesse.

  Clique e arraste o ponteiro através da janela de gráfico para criar um retângulo que contenha a área que deseje Ampliar. Quanto menor for a área, maior será a mudança de escala. O conteúdo da área contida pelo retângulo ocupará toda a janela de gráficos quando o botão do mouse for solto. Para cancelar a operação atual da ferramenta Ampliar, pressione Esc enquanto o botão do mouse está apertado.

Se você possuir um mouse com roda, use a roda para ampliar ou diminuir. Para fazer um pan com a roda, mantenha a roda apertada e arraste o mouse. O conteúdo da janela gráficos move na medida que você move o mouse.


Comando Diminuir

Use este comando para aumentar a área visualizada numa janela de gráficos.

Para acessá-lo, escolha uma das seguintes opções:

  Selecione Visualizar / Zoom / Diminuir.

  Selecione a ferramenta Diminuir [image].

Se o Navegador do Zoom estiver apresentado, a área da visualização da janela de gráficos é apresentada como um quadro preto na janela Navegador do Zoom. Se você diminuir além das extensões do projeto, nenhum quadro preto é apresentado no Navegador do Zoom.

Para usar a ferramenta Diminuir:

1.	Mova o apontador sobre a janela de gráficos.

O apontador em forma de lente de aumento aparece com um sinal de menos dentro. Fios cruzados sobre o apontador de lente de aumento marcam o ponto de interesse.

2.	Faça um dentre o seguinte:

  Clique numa posição da janela de gráficos. A escala da janela gráficos muda e fica centrada no ponto de interesse.

 Clique e arraste o ponteiro através da janela de gráfico para criar um retângulo que contenha a área desejada e solte o botão. A escala do janela de gráficos muda e a informação anteriormente apresentada na janela de gráficos aparecerá na área retangular selecionada. Quanto menor for o retângulo, maior será a mudança de escala. Para cancelar a operação atual da ferramenta Diminuir, pressione Esc enquanto o botão do mouse está apertado.

Se você possuir um mouse com roda, use a roda para ampliar ou diminuir. Para fazer um pan com a roda, mantenha a roda apertada e arraste o mouse. O conteúdo da janela gráficos move na medida que você move o mouse.


Comando Zoom extensões

Use este comando para visualizar todos os pontos visíveis do projeto atual. Ao selecionar o comando Zoom extensões, a janela de gráficos ajusta-se automaticamente de modo que todos os dados serão visíveis.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Zoom / Extensões.

  Pressione Ctrl+E.

  Selecione a ferramenta Zoom Extensões [image].

  Coloque o ponteiro na janela de gráficos. Clique o lado direito e selecione Zoom Extensões no menu atalho.


Comando Zoom Anterior

Use este comando para voltar através de cada visualização de zoom anterior desde que entrou no projeto.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualização / Zoom / Anterior.

  Selecione a ferramenta Zoom Anterior [image].

Se o Navegador do zoom estiver visível, a área visualizada na janela de gráficos é mostrada como um quadro preto na janela Navegador do zoom. Se você diminuir além das extensões do projeto, o quadro preto não será apresentado no Navegador do zoom.

Se houver mais de uma janela de gráficos abertas, uma pilha de zoom separada será armazenada para cada janela.


Comando Pan

Use este comando para mudar o centro da área do zoom para apresentar uma área diferente da visualização da tela.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Pan.

  Selecione a ferramenta Pan [image].

Aparece o apontador em forma de mão.

Se o Navegador de Zoom for apresentado, a área na visualização da janela gráficos é mostrada como um quadro preto na janela Navegador de Zoom. Se o pan for além das extensões do projeto, o quadro preto não é apresentada no Navegador de Projeto.

Um pan não é lembrado como no caso do zoom. Portanto, não pode-se fazer Zoom Anterior para voltar à visualização original antes a partir do pan.

Para usar a ferramenta Pan:

1.	Move o apontador sobre a janela de gráficos.

Fios cruzados sobre o apontador marcam o ponto de interesse.

2.	Clique e arraste o apontador para onde deseja fazer o pan. O conteúdo da janela gráficos move em tempo real na medida que se move o mouse.

Se você possuir um mouse com uma roda, use a roda para ampliar e diminuir. Para fazer pan com a roda, mantenha a roda apertada e arraste o mouse. O conteúdo da janela gráfico move na medida que se move o mouse.


Comando Pan Para

Use este comando para fazer um pan e escala para um lugar determinado na janela de gráficos.

Aparece o diálogo Pan Para.


Diálogo Pan Para

Use este diálogo para fazer um pan ou escala para um lugar determinado na janela de gráficos.

Para acessá-lo, selecione Visualizar / Pan Para.

Centro do visualização

Estes campos lhe permitem completar ações de preenchimento de campo, tais como especificação de um nome ou um local para o centro da visualização.

Nome do ponto	Use este campo para especificar o nome do ponto do banco de dados. Se você usar preenchimento de campo para este campo, os campos Nome do ponto, Norte e Leste serão preenchidos.
Norte/Leste	Use estes campos para localizar o centro da visualização. Se usar preenchimento de campo, os campos Norte e Leste serão preenchidos.
Raio para visualização

O campo Raio para visualização configura a extensão da visualização. Se você não especificar um unidade, a configuração da unidade da distância na guia Unidades e Formato do diálogo Propriedades do Projeto será usada.


    Comando Filtros

Use este comando para abrir o diálogo Visualizar filtros.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Filtros.

  Selecione a ferramenta Visualizar filtros [image].

  Clique o ícone Visualizar filtros [image] na barra de estado.


    Diálogo Visualizar Filtros

Use este diálogo para filtrar qualquer observação não desejada enquanto se trabalha na Visualização do levantamento.

NOTA: Dados que estiveram ocultos pelo filtro da visualização não podem ser selecionados com o uso dos comandos no menu Selecionar.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Filtros

  Selecione a ferramenta Visualizar filtros

  Pressione Ctrl+F

Observações

Use este grupo para selecionar os grupos de observação que deseja visualizar. Isso é útil se possuir um projeto com vários tipos de observações, por exemplo, RTK e convencional, e quer-se visualizar tão somente informações RTK.

Mostrar todas observações

Selecione esta opção para visualizar todas as observações do projeto. Esta opção aparece se tiver o módulo de Ajuste de Rede instalado.

Mostrar somente observações marcadas para ajuste

Selecione esta opção para visualizar somente as observações que possuam marcado o quadro de verificação Usar no ajuste da rede (este quadro de verificação encontra-se na página Sumário da janela Propriedades).

Esta opção aparece se o módulo Ajuste da Rede estiver instalado. Se esta opção for selecionada, alguns dos campos dos Grupos de observação não estarão disponíveis.

Mostrar somente observações capazes de ser ajustadas

Selecione esta opção para visualizar somente as observações que possam ser usadas num Ajuste de Rede, mas que não tenham necessariamente o quadro de seleção Usar no ajuste da rede marcado (este quadro de seleção encontra-se na página Sumário da janela Propriedades).

Por exemplo, observações desativadas e observações ativadas como verificação podem ser selecionadas se elas puderem ser usadas num ajuste de rede.

Potenciais linhas de base e observações convencionais (que não podem ser utilizadas num Ajuste de Rede) são filtradas.

NOTA: Esta opção aparece se existir instalado um módulo de Ajuste da Rede. Se você selecionar esta opção, alguns dos campos dos Grupos de Observação não serão disponíveis.

Tipos de observações para mostrar

O grupo tipos de observações para mostrar contém os seguintes quadros de verificação:

  RTK

  Cinemático PP

  Laser

  Delta Elevations

  Estático

  Terrestre

  Reduzido

  Azimute

  Linhas de base não processadas

Use estes quadros de verificação para selecionar os tipos de observação que quer-se visualizar. Por exemplo, para visualizar somente vetores RTK, selecione o quadro de verificação RTK e limpe os outros do grupo.

  Observações laterais

  Contínuo

  Observações desativadas

  Observações de verificação

Use estes quadros de verificação para selecionar os tipos de observações que deseja ver. Deve-se especificar quais os tipos de observações do grupo superior que deseja serem filtradas pelas observações do grupo inferior.

Por exemplo, para visualizar somente observações de verificação RTK, selecione os quadros de verificação RTK e Verificar observações e limpe os outros de cada grupo.

NOTA: Se uma observação possuir mais de uma propriedade de observação, deve-se selecionar os quadros pertinentes ao tipo de observação para visualizá-los.

Mostrar pontos não conectados

Selecione este quadro de verificação para mostrar pontos sem observações fluindo de e para ele como, por exemplo, pontos teclado.

Mostrar eventos

Marque esta caixa de seleção para exibir eventos.

Mostrar somente dados do grupo de seleção

Marque esta caixa de seleção para exibir dados que foram previamente salvados como um grupo de seleção. Selecione o grupo de seleção na lista.

Use Linha do Tempo para exibir linhas de base GPS dependentes

Quando este quadro de seleção está marcado, somente as observações mostradas na visualização da Linha do tempo será exibida na janela de gráficos.

Pode-se usar esta ferramenta para selecionar linhas de base independentes para o ajuste de rede.

Use o botão Visualização da linha de base dependente na barra de ferramentas para ativar e desativar esta opção.

NOTA: Esta opção somente aplica-se a dados GPS pós-processados. Todos outros dados serão mostrados na janela de gráficos, com os filtros de visualização aplicados.

NOTA: Esta opção somente é disponível se tiver instalado o módulo de processamento da linha de base.

Hora

Marque esta caixa se seleção para mostrar somente observações GPS que estejam dentro de um determinado limite de data e hora. Os campos De e Para são ativados.

De / Para

Use preenchimento de campo (selecione a hora do marcador de horas na linha de tempo ou use o teclado para inserir os limites da hora e data das observações GPS a serem apresentados). Também pode-se inserir o dia Juliano.


Guias do Ponto - Perspectiva geral

Outras informações

Como ...	Ver também
Perspectiva geral

Para apresentar informações na janela de gráficos sobre as entidades sem armazenar aquelas informações no banco de dados, use guias. Guias são disponíveis tanto na Visualização do levantamento como na Visualização do plano.

As configurações das guias são restauradas quando volta-se a abrir um projeto entre sessões de trabalho. Para armazenar informações sobre entidades do banco de dados do projeto, use anotações. Somente pode-se adicionar anotações na Visualização do plano.

Pode-se colocar guias em pontos com combinações de campo e texto definido pelo usuário. Para adicionar opções de guia personalizada, use um editor de texto para editar o arquivo Options.ini. Guias sempre aparecem à direita do ponto que a está recebendo.

Etiquetas são apresentadas com o uso da fonte e tamanho designados ao Dicas de ferramentas das configurações da aparência do Microsoft Windows.


Comando Barra do projeto

Use este comando para mostrar e ocultar a barra do projeto.

Para acessá-lo, faça um dos seguintes:

  Selecione Visualizar / Barra do projetor.

  Selecione a ferramenta Barra do projeto [image].


Comando Atualizar

Use este comando para refrescar a tela.

Para acessá-lo, faça um dentre o seguinte:

  Selecione Visualizar / Refrescar.

  Pressione F5.

Selecione este comando para voltar a desenhar a visualização do plano quando a janela de gráficos é sobrescrita e difícil de ler.


Diálogo Opções de visualizações

Use este diálogo para personalizar a visualização dos dados. Para acessá-lo, selecione Visualizar / Opções.

O diálogo Opções de visualizações possui as seguintes guias:

  Linhas do grid

  Inscrição do levantamento

  Dados de levantamento

  Controle da elipse do erro

  Mapa de fundo


Diálogo Opções de visualizações - guia Etiquetas do ponto

Diálogo Etiquetas do Ponto

Use esta guia para exibir etiquetas do ponto para o projeto.

Para acessá-la, no menu principal, selecione Visualizar / Etiquetas do ponto.

Etiquetar pontos com

Selecione os campos com os quais quer etiquetar pontos. As seguintes opções são fornecidas com o Trimble Geomatics Office. Todas opções de etiquetamento personalizado adicionado com o uso do arquivo Opções.ini aparecem nesta lista:

  Nome

  Código da característica

  Elevação

  Fator de escala do grid

  Fator de escala da elevação

  Fator de escala combinado

  Ângulos de convergência

  Qualidade horizontal

  Qualidade da elevação

  Qualidade da altura

Aplicar para

São duas as opções disponíveis para o etiquetamento de pontos:

  Seleção − selecione esta opção para etiquetar os pontos selecionados.

  Todo o banco de dados − selecione esta opção para etiquetar todos os pontos. Quando nada é selecionado no visualizador de levantamento, esta opção é selecionada por padrão.

Quando se etiqueta uma seleção, o Trimble Geomatics Office produz automaticamente um grupo de seleção nomeado do pontos etiquetados.

NOTA: Somente pode-se etiquetar uma seleção de cada vez. Se você contar com uma seleção de pontos etiquetados e então etiquetar uma nova seleção, as etiquetas da primeira seleção serão desmarcadas.

Limpar

Clique Limpar para remover todas etiquetas atuais.

NOTA: As configurações da etiqueta serão reativadas quando se abre um projeto com etiquetas de ponto.

SUGESTÃO: Para mudar a fonte e o tamanho do texto, use as configurações de apresentação da janelas padrões do Microsoft Windows para obter Dicas de ferramenta.


Diálogo Opções de visualizações - guia Linhas do grid

Use esta guia para visualizar linhas do grid na janela de gráficos.

Para acessá-la:

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções de visualizações.

2.	Selecione a guia Linhas do grid.

Mostrar linhas do grid

Marque esta caixa de seleção para mostrar as linhas do grid na janela de gráficos. Quando as linhas de grid são exibidas, o intervalo de grid é mostrado na barra de status.

NOTA: Também pode-se mostrar linhas de grid selecionando o botão de linhas de grid na barra de ferramentas [image].

Os seguintes itens tornam-se disponíveis:

Número fixo de linhas do grid

Use esta opção para especificar o número de linhas de grid que será mostrado na tela. Ao fazer um zoom aumentando ou reduzindo, o mesmo número de linhas do grid será exibido.

NOTA: O número fixo de número de linhas de grid será mostrado ao longo do lado mais curto da tela.

Intervalo do Grid

Use esta opção para especificar o intervalo do grid. As unidades da distância serão aquelas especificadas para o projeto.

NOTA: Se houverem demasiadas linhas de grid para serem visualizadas claramente na tela, as linhas de grid não serão exibidas.

Tipo de linha do grid

Use esta opção para selecionar o estilo de linhas do grid, por exemplo, sólidas ou pontilhadas.

Cor da linha do grid

Use esta opção para selecionar a cor das linhas do grid. Talvez seja necessário mudar a cor das linhas do grid para que apareçam claramente contra a cor do fundo da janela de gráficos.

Etiquetar linhas do grid

Marque esta caixa de seleção para etiquetar linhas do grid com valores do norte e leste.

NOTA: Linhas do grid serão impressas quando se seleciona o comando Plotar/Imprimir.


Diálogo Opções de visualização - guia Inscrição do levantamento

Use esta guia para mudar as cores usadas para exibir o projeto na janela de gráficos do Trimble Geomatics Office. Ela determina:

  quantos diferentes tipos de observações e pontos são exibidos na visualização do Levantamento

  a cor de fundo da janela de gráficos

  a cor padrão para o texto

Para acessá-la:

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções de visualizações.

2.	Selecione a guia Inscrição do levantamento.

Estilo da legenda

Neste campo, selecione Preto ou Padrão. A tabela seguinte descreve as especificações de cores que cada opção determina:


Diálogo Opções de visualizações - guia Dados de levantamento

Use esta guia para mudar o modo em que os dados de levantamento são apresentados na janela de gráficos.

Para acessá-la:

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções de visualizações.

2.	Selecione a guia Dados de levantamento.

NOTA: Esta guia somente fica visível quando se está na visualização do levantamento.

Use vetores de ponta para laterais

Marque esta caixa de seleção para exibir vetores de observação de laterais como pontas.

Mostra número de observações (onde >1)

Marque esta caixa para exibir o número de observações de linhas múltiplas.

Quando uma observação é filtrada, o número de observações é mostrado como um índice daquele que está sendo exibido para o número total de observa, por exemplo, 1/3.


Diálogo Opções de visualizações - guia Controles da elipse do erro

Use esta guia para determinar se elipses de erro, setas de altos erros e setas de erro de elevação aparecerão na janela de gráficos após o ajuste. Também pode-se determinar a escala de elipses de erro e o tamanho das marcas de verificação.

Para acessá-la:

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções de visualizações.

2.	Selecione a guia Controles da elipse do erro.

NOTA: Esta guia somente é disponível quando se está na visualização de levantamento.

Mostrar elipses e setas de erro do ponto

Marque esta caixa de verificação para mostrar elipses e setas de erro do ponto.

Mostrar erros de elevação

Marque esta caixa de verificação para mostrar erros de elevação.

Mostrar erros de alturas

Marque esta caixa de verificação para mostrar erros de altura.

Escala da elipse de erro

A Escala do medidor da elipse do erro,  mostrada abaixo, controla o tamanho de elipses de erro que aparecem na janela de gráficos depois de um ajuste.

Para diminuir a elipse, mova o medidor para a esquerda. Para aumentar a elipse, mova o medidor para a direita.

Tamanho das marcas

Use este campo, mostrado abaixo, para determinar a distância entre as marcas que aparecem nas escalas da barra de elipse do erro na janela de gráficos.

As escalas de barra tornam-se mais compridas quando aumentam de tamanho, enquanto que a distância entre as marcas muda para combinar com o valor que aparece no campo Tamanho da marca.


Diálogo Opções de visualizações - guia Mapa de fundo

O Trimble Geomatics Office pode exibir arquivos de fundo na janela de gráficos. É possível importar arquivos de fundo tais como do formato Drawing Exchange Format (.dxf), Windows Bitmap (.bmp) ou formato de Arquivo Tagged Image (.tif) para exibir arquivos do formato Windows Bitmap (.bmp), ou os arquivos do formato de Arquivo Tagged Image (.tif) devem ter referências geográficas para que possam ser exibidos corretamente.

O formato de arquivo World da ESRI é usado para referenciar geograficamente arquivos de fundo. Um arquivo World é um arquivo de texto ASCII com uma extensão .tfw ou .wld. O Trimble Geomatics Office possui os seguintes requerimentos para os arquivos World. Eles devem:

  ser armazenados no mesmo local do arquivo relacionado .dxf, .bmp ou.tif

  ter o mesmo sistema de coordenadas do projeto Trimble Geomatics Office

  ter as mesmas unidades do projeto Trimble Geomatics Office

NOTA: O Trimble Geomatics Office suporta arquivos TIFF não comprimidos e os seguintes métodos de compressão: CCITT, PackBits, Thunder, Next, LogLuv. Porém, não suporta os seguintes arquivos comprimidos: OJPEG, JPEG, ZIP, LZW, PixarLog.

NOTA: O Trimble Geomatics Office também não suporta arquivos .bmp comprimidos RLE.

Use a guia de Mapa de fundo para selecionar um arquivo de fundo para exibir.

Para acessá-lo:

1.	Selecione Visualizar / Opções. Aparece o diálogo Opções de visualizações.

2.	Selecione a guia Mapa de fundo.

Nomes de arquivo

Este grupo mostra uma lista de arquivos que foram selecionados para serem usados como mapas de fundo.

Adicionar

Use o botão Adicionar para selecionar os arquivos de fundo. Pode-se selecionar um arquivo .dxf, .bmp, ou .tif.

NOTA: Certifique-se de que o arquivo World relacionado está armazenado no mesmo local. Não há necessidade de selecionar este arquivo na lista.

Remover

Use o botão Remover para remover um arquivo de fundo da lista.

Formato de arquivo World

Um exemplo de um formato de arquivo World segue abaixo:

20.17541308822119

0.00000000000000

0.00000000000000

−20.17541308822119

424178.11472601280548

4313415.90726399607956

Estes 6 valores são usados para calcular uma transformação de imagem para o mundo, usando uma transformação ligada de seis parâmetros na forma de:

x1 = Ax + By + C

y1 = Dx + Ey + F

Onde

x1	coordenada x calculada do pixel no mapa

y1 	coordenada y calculada do pixel no mapa

x 	número da coluna de um pixel na imagem

y 	número de fila de um pixel na imagem

A 	escala; dimensão de um pixel em unidades de mapa na direção x

B, D	termos de rotação

C, F	termos de translação; coordenadas x,y do mapa do centro do pixel da esquerda superior

E 	negativo de escala y; dimensão de um pixel em unidades de mapa na direção y

Os parâmetros de transformação são armazenados num arquivo World na seguinte ordem:

20.17541308822119 − A

0.00000000000000 − D

0.00000000000000 − B

-20.17541308822119 − E

424178.11472601280548 − C

4313415.90726399607956 − F

NOTA: O software Trimble Geomatics Office não suporta a rotação de imagens. Se o seu arquivo do Mundo tiver termos não zero (parâmetros D e B), eles não serão usados.

NOTA: O sinal da escala x (A) ou escala y (E) muda dependendo da orientação do sistema de coordenadas. Isso porque as origens de uma imagem e um sistema de coordenadas geográfico são diferentes. A origem de uma imagem é sempre o ângulo esquerdo superior, enquanto a origem de um sistema de coordenadas geográfico muda dependendo da direção da coordenada.

Por exemplo, para um sistema de coordenadas NL, a origem do sistema de coordenadas do mapa está localizado no ângulo esquerdo inferior. Valores da fila da imagem aumentam a partir do ângulo esquerdo inferior para cima. Portanto, para um sistema NL, a escala y (E) é negativa. A seguinte tabela resume o sinal das escalas x e y que você deve usar para os sistemas de coordenadas NL, SL e NO:

	NL	SO	NO
x(A)	+ve	-ve	-ve
y(E)	-ve	+ve	-ve


Garantia

Garantia Limitada do Software e Firmware

A Trimble garante que este produto do software da Trimble (o “Software”) está substancialmente conforme as especificações publicadas aplicáveis da Trimble para o Software por um período de noventa (90) dias, iniciando a partir da data de entrega.

Recursos para a Garantia

A única responsabilidade da Trimble e o seu único recurso sob as garantias especificadas acima será, como bem escolher a Trimble, consertar ou substituir qualquer produto ou software que não esteja conforme tal garantia ("Produto Não -Conforme") ou reembolsar o preço pagado por qualquer tal Produto Não-Conforme, após a devolução do mesmo à Trimble.

Exceções da Garantia

Estas garantias devem ser aplicadas somente no caso e ao ponto de: (i) os Produtos estejam devidamente e corretamente instalados, configurados, com interface apropriada, bem armazenados, mantidos e operados de acordo com o manual e especificações pertinentes do operador da Trimble, e; (ii) os Produtos e Software não estejam modificados ou não foram usados incorretamente. Essas garantias não serão aplicadas a, e a Trimble não será responsável por, qualquer reivindicação de quebra da garantia baseada em (i) defeitos ou problemas de performance provenientes da combinação ou utilização do Produto ou Software com produtos, informações, sistemas ou dispositivos não fabricados, fornecidos ou especificados pela Trimble; (ii) a operação do Produto ou Software sob qualquer especificação diferente de, ao além de, as especificações padrões da Trimble para os seus produtos; (iii) a modificação ou uso não autorizados do Produto ou Software; (iv) danos causados por relâmpagos, outras descargas elétricas, ou imersão ou borrifação de água doce ou salgada; ou (v) desgaste normal de partes consumíveis (por ex.: pilhas).

AS GARANTIAS ACIMA ESPECIFICAM A RESPONSABILIDADE TOTAL DA TRIMBLE E A PERFORMANCE EXCLUSIVA DOS PRODUTOS E SOFTWARE, EXCETO QUANDO EXPRESSAMENTE FORNECIDO NESTE ACORDO, A TRIMBLE FORNECE OS PRODUTOS E SOFTWARE COMO ELES SÃO, SEM GARANTIAS, NEM EXPRESSAS NEM IMPLICADAS, E ESTÃO EXPRESSAMENTE EXCLUÍDAS DE GARANTIAS IMPLICADAS DE COMÉRCIO E UTILIDADE PARA UM FIM DETERMINADO. AS GARANTIAS EXPRESSAS ESPECIFICADAS REPRESENTAM TODAS AS OBRIGAÇÕES E RESPONSABILIDADES DA PARTE DA TRIMBLE, QUE NASÇAM DE, OU COM CONEXÃO COM, TODOS PRODUTOS OU SOFTWARE. ALGUNS ESTADOS E JURISDIÇÕES NÃO PERMITEM LIMITAÇÕES NA DURAÇÃO DE UMA GARANTIA IMPLICADA, NESTE CASO A GARANTIA ACIMA NÃO APLICA-SE AO TEU CASO.

Limitação de responsabilidade

NA EXTENSÃO MÁXIMA PERMITIDA POR LEI APLICÁVEL, A TRIBLE NÃO SERÁ RESPONSÁVEL PERANTE VOCÊ POR NENHUM DANO INDIRETO, ESPECIAL OU CONSEQÜENCIAL DE QUALQUER ORIGEM OU SOB QUALQUER CIRCUNSTÂNCIA OU TEORIA LEGAL RELACIONADA DE QUALQUER FORMA AOS PRODUTOS OU SOFTWARE, INDEPENDENTE SE A TRIMBLE FOI AVISADA DA POSSIBILIDADE DE QUALQUER PERDA DESTE TIPO OU INDEPENDENTE DO CURSO DO USO QUE SE DESENVOLVE OU JÁ SE DESENVOLVEU ENTRE VOCÊ E A TRIMBLE. COMO ALGUNS ESTADOS E JURISDIÇÕES NÃO PERMITEM A EXCLUSÃO OU LIMITAÇÃO DA RESPONSABILIDADE DE DANOS CONSEQÜÊNCIAIS OU INCIDENTAIS, AS LIMITAÇÕES ACIMA NÃ NÃO APLICAM-SE A VOCÊ.

DE QUALQUER FORMA, A ÚNICA RESPONSABILIDADE DA TRIMBLE, E O SEU ÚNICO RECURSO OU QUEBRA DESTE ACORDO, SERÁ A DEVOLUÇÃO DO PREÇO DA COMPRA OU TAXA DE LICENÇA PAGADA PELOS PRODUTOS OU SOFTWARE.


Bem-vindo à Ajuda do Trimble Geomatics Office™.

Esta ajuda foi projetada para fornecer as informações requeridas para usar com eficiência a potência total e capacidades do software Trimble Geomatics Office. Ela também descreve como configurar e usar o Trimble Geomatics Office.

  Uso da Ajuda

  Trimble Geomatics Office – Perspectiva geral

  Sobre a Trimble

  Comentários


Comando Nova Janela

Use este comando para abrir outra janela para abrir outra janela para o projeto atual.

Para acessá-lo, selecione Janela / Nova Janela.

Toda nova janela é adicionada à lista de janelas do menu Janela.

A nova janela possui o mesmo conteúdo da janela ativa. Várias janelas podem ser abertas para exibir diferentes partes ou visualizações do projeto ao mesmo tempo. Por exemplo, diferentes janelas podem ser abertas e uma diferente camada do projeto pode ser exibida em cada janela.

Se o conteúdo for mudado numa janela, todas outras janelas que contenham o mesmo projeto refletem as mudanças, desde que estejam exibindo aquelas informações.

Ao abrir uma nova janela, ela torna-se a janela ativa e aparece no alto de todas outras janelas abertas.


Comando Cascata

Use este comando para sobrepor várias janelas abertas do projeto.

Para acessá-lo, selecione Janela / Cascata.

As janelas são sobrepostas de modo que possa ver a barra de títulos de cada uma delas.


Comando Lado a Lado

Use este comando para voltar a organizar todas janelas do projeto atualmente abertas.

Para acessá-la, selecione Janela / Lado a Lado.

As janelas são organizadas e colocam-se lado a lado.


Comando Organizar ícones

Use este comando para reorganizar todos ícones de janelas minimizadas num padrão ordenado na tela.

Para acessá-lo, selecione Janela / Organizar ícones.

Os ícones são organizados na base da janela.


Comando Dividir

Use este comando para visualizar duas partes de um projeto simultaneamente.

Para acessá-lo, selecione Janela / Dividir.

A divisão dentro da janela pode ser mudada clicando e arrastando a barra separadora. Mudanças feitas numa parte ocorrem simultaneamente na outra.


Comando Exibir lista

Use este comando para abrir uma janela da lista exibida.

Para acessá-lo, selecione o menu da lista de exibição da janela.


Site WWW

Para uma olhada interativa da Trimble, visite o nosso site na WWW
www.trimble.com/


Janela Propriedades - Perspectiva geral

A janela Propriedades lhe permite visualizar informações sobre todas entidades (pontos, observações, linhas, arcos, curvas, texto, anotação, notas).

Use a janela Propriedades para visualizar e editar propriedades de uma entidade selecionada. Somente pode-se visualizar as propriedades de uma entidade de cada vez. Todas mundaças feitas nas entidades na janela Propriedades são aplicadas imediatamente.

Pode-se mudar o tamanho da janela Propriedades, clicando e arrastando a caixa da janela. Clique no botão do ângulo superior direito para fechar a janela.

Pode-se manter a janela Propriedades aberta enquanto outras partes do Trimble Geomatics Office estão sendo usadas. A janela Propriedades é atualizada automaticamente para exibir as informações corretas sobre o grupo de seleção.

Se tiver definido um grupo atual de seleção e selecionar uma entidade para visualizar da lista de seleção da janela Propriedades, a seleção atual da janela gráficos é atualizada para incluir somente a entidade que se está visualizando. A lista de seleção da janela Propriedades mantém o grupo de seleção original. Todas entidades realçadas na lista de seleção da janela Propriedades tornam-se o grupo de seleção atual da janela de gráficos.

A visualização em forma de árvore da janela Propriedades exibe os nomes e os valores do item selecionado na tela. A visualização em forma de árvore exibe o relacionamento entre as entidades. Por exemplo, pode-se visualizar o ponto “de” e “para” para qualquer observação ou entidade de tipo de linha, clicando no sinal de mais (+) e selecionando o ponto que deseja visualizar e editar.

A visualização pode ser recolhida ou expandida nos seus nós:

  Clique o sinal de mais (+) para expandir a visualização da árvore.

  Clique o sinal de menos (–) para recolher a visualização da árvore.

As informações e guias disponíveis do lado direito da janela Propriedades depende do tipo de entidade selecionada.

Ferramentas de seleção da janela Propriedades

As ferramentas de seleção da janela Propriedades lhe permitem configurar a lista de seleção.

Seleção	Ícone	Clique este botão para ...
Agrupar dados de levantamento		agrupar dados de levantamento por fonte, tipo de dados ou direção da observação.
Classificar		classificar as entidades da lista de seleção. Selecione a opção que deseja da lista. Pode-se optar por classificar pontos por ordem do banco de dados, elevação, nome, qualidade, horário de início, duração da ocupação ou tipo de dados.
Filtro		manter somente pontos, observações, observações sinalizadas ou o grupo atual da seleção. Também pode-se remover a seleção atual. NOTA: Pode-se adicionar suas próprias perguntas à lista do filtro.

Indicadores de Qualidade

Indicadores de qualidade são pequenos símbolos que aparecem ao lado direito de cada campo na página Resumo. Estes símbolos exibem a qualidade dos dados de levantamento. A qualidade pode ser controle fixo, controle, levantamento, mapeamento, desconhecido ou ajustado. Os indicadores de qualidade também são usados no relatório de Derivação do ponto e no relatório Recomputar.

Indicadores do Geóide

Indicadores do geóide exibem se o componente de elevação ou altura de um ponto foi derivado a partir do geóide definido para o projeto. O indicador do geóide aparece com o indicador da qualidade.

Por exemplo, se um ponto RTK for medido, ele possui uma altura WGS-84 e uma elevação derivada de um geóide. Se um ponto terrestre for coletado, ele possuirá uma elevação e uma altura WGS-84 derivada do geóide.

Indicadores de geóide também são usados no Relatório de derivação do ponto e no relatório Re-computar.

A qualidade do geóide do modelo geóide é determinada na guia Re-computar do diálogo Propriedades do projeto.

Ferramenta Auto rollup

Use esta ferramenta [image]  para minimizar a janela Propriedades quando estiver selecionando as entidades na janela Gráficos.

Bloquear janela aberta

Use esta ferramenta [image] para garantir que, quando a janela Propriedades estiver aberta, ela permanece do mesmo tamanho.


Janela Propriedades - guia Levantamento - Perspectiva geral

Use a guia Levantamento para visualizar e editar as propriedades relacionadas ao levantamento de uma entidade na seleção. Pode-se visualizar as propriedades de entidades que aparecem na visualização de Levantamento, tais como:

  Pontos

  Observações GPS

  Observações convencionais

  Observações do nível

  Observações do telêmetro a laser

  Observações reduzidas (offsets)

Páginas

As informações de levantamento são organizadas em páginas. Somente uma página pode ser visualizada de cada vez. Pode-se acessar as páginas usando os botões de menu disponíveis. Os botões de menu acessam todas informações de levantamento e dependem do tipo de entidade atualmente selecionada.

Apagando pontos e observações

Para apagar um ponto ou observação, use o botão Apagar [image] da janela Propriedades. Se um botão ou observação não puder ser apagado, o botão Apagar não é disponível.

NOTA: Uma coordenada fixa não pode ser apagada. “Solte” a coordenada para poder apagá-la.


Janela Propriedades - guia Levantamento - Pontos

 Perspectiva geral

Use a guia Levantamento da janela Propriedades para visualizar e editar as informações relacionadas ao levantamento do ponto selecionado. As informações de levantamento são organizadas em páginas.

Pode-se acessar as seguintes páginas, clicando o botão apropriado do menu:

Sumário
Aviso
Ocupações e configurações
Estimativa do erro


Janela Propriedades - guia Levantamento - página Resumo (Pontos)

Mais informações

Como

Usar a página de Resumo para visualizar a posição derivada e qualidades para o ponto selecionado na janela Propriedades.

Para acessá-la, na janela Propriedades:

Selecione a guia Levantamento, clique o botão do menu Resumo

Nome do ponto

Exibe o nome do ponto. Insira um valor neste campo para mudar o nome.

Campos da coordenada

Exibe a posição derivada do ponto e as qualidades designadas para cada componente. Os campos de coordenadas exibidos são dependentes do grupo de opção exibido.

Grid / Local / WGS-84

Selecione a opção de visualização da coordenada para o ponto.

NOTA: Se a opção de visualização for configurada para WGS-84, os campos de coordenadas exibidos dependerão no que foi configurado para Apresentar WGS-84 na guia Unidades e Formato do diálogo Propriedades do projeto. Por exemplo, se o campo Apresentar WGS-84 como for configurado para L,L,A os campos da coordenada da página Resumo receberão a etiqueta de Latitude, Longitude, Altura. Se o campo Apresentar WGS-84 como for configurado para X,Y,Z os campos WGS-84 serão apresentados como X, Y, Z.

Relatório de derivação

Selecione a ferramenta Relatório de derivação [image] para exibir o Relatório de derivação do ponto.

Adicionar coordenada

Selecione a ferramenta Adicionar coordenada [image] quando desejar digitar um grid, coordenada local ou WGS-84 inserida no escritório (somente faça isso quando quiser que o software use as coordenadas inseridas no escritório em preferência às coordenadas derivadas de observações). A coordenada digitada terá uma fonte inserida no escritório.

Somente pode-se contar com uma coordenada grid/local e uma WGS-84 inserida no escritório associada com um ponto. Se um WGS-84 e uma coordenada grid ou local já existir, a ferramenta Adicionar coordenada não será disponível.

NOTA: Quando adicionar uma coordenada, os campos do componente de coordenada e a qualidade serão nulos. Para inserir a posição do ponto e qualidade atuais, selecione a ferramenta Inserir valor atual [image].


Janela Propriedades - guia Levantamento - página Aviso

Use a página Aviso para visualizar e descartar as mensagens associadas aos sinalizadores de aviso que aparecem nos pontos ou observações da visualização Levantamento.

Para fazê-lo:

1.	Escolha uma das seguintes opções:

  Clique duas vezes num ponto ou observação com um sinalizador indicador de aviso que deseje visualizar.

  Clique duas vezes no ícone sinalizador de aviso da barra de status para selecionar todos pontos com sinalizadores indicadores de aviso.

Aparece a janela Propriedades.

2.	Se contar com mais de uma entidade na seleção, selecione a entidade que desejar visualizar.

3.	Para acessar a página de Aviso, clique o botão do menu Aviso [image].

Deve-se resolver ou descartar todos sinalizadores de aviso antes de exportar coordenadas. Quando um Fechamento fora da tolerância for resolvido através da desativação de uma má observação ou através de um nome novo do ponto se a observação foi para um ponto físico diferente, o sinalizador de erro desaparecerá.

A seguinte tabela descreve as mensagens que podem aparecer com os sinalizadores de aviso:

Suprimir esta passagem

Marque esta caixa de seleção para suprimir o sinalizador de aviso associado ao ponto ou observação selecionados, se decidir que o erro é aceitável para o levantamento. O sinalizador torna-se branco na janela Propriedades e desaparece da janela de gráficos.

NOTA: Se todos os sinalizadores de aviso forem suprimidos, o ícone sinalizador da barra de status passa a ser branco.

Se contar com um ponto selecionado, pode-se selecionar a ferramenta Derivação do ponto [image] para visualizar o Relatório da derivação do ponto.

Use isso para determinar como a posição do ponto foi derivada e porque o erro ocorreu.


Janela Propriedades - guia Levantamento - páginas de Ocupações e Configurações

Use as páginas de Ocupações e configurações para visualizar e corrigir a ocupação GPS ou detalhes de configuração terrestre do ponto ou observação selecionados na janela Propriedades.

As seguintes páginas são disponíveis, dependendo do tipo de entidade selecionado e do método de campo usado:

Para acessar estas páginas, na janela Propriedades:

1.	Selecione a observação.

2.	Clique o botão do menu Ocupações e configurações [image].

NOTA: Se houver mais de uma ocupação ou configuração para o ponto, aparece um menu de atalho. Selecione a página que deseje visualizar. Na medida que se mantém o mouse sobre as diferentes ocupações e configurações do menu de atalho, os detalhes são atualizados na página.

Um ponto possui mais de uma ocupação. No entanto, uma observação somente terá um “do” ponto e um “para” ponto.


Janela Propriedades - guia Levantamento - página Ocupação GPS

Use a página Ocupação GPS para visualizar e corrigir os detalhes de ocupação do ponto selecionado. O conteúdo da página é o mesmo se o ponto foi usado como a estação da base ou posição do rover.

Para acessá-la, na janela Propriedades:

1.	Selecione a guia Levantamento.

2.	Escolha uma das seguintes opções:

  Se tiver selecionado um ponto, clique o menu Ocupações e configurações [image].

NOTA: Se houver mais de uma ocupação ou configuração para o ponto, aparece um menu de atalho. Selecione a página que deseja visualizar.

Se tiver selecionado uma observação GPS, clique o botão da página Ocupação da base [image] para visualizar os detalhes da ocupação da base; ou clique no botão do menu da Ocupação do rover [image] para visualizar os detalhes de ocupação do rover.

Ponto

Exibir o nome do ponto ocupado.

Hora

Exibe o período (de tempo) da ocupação de o tempo de início da ocupação.

NOTA: Durante a importação de dados, os horários de Início e de Fim são convertidos do Tempo GPS ao UTC (Horário Universal Coordenado—ou o Horário de Greenwich). Os horários são então exibidos como horários locais usando o grupo da Zona do tempo no Microsoft Windows.

SUGESTÃO: Posicione o ponteiro sobre o campo para visualizar uma dica de ferramenta do tempo de parada da ocupação.

Detalhes da antena

O grupo de detalhes da antena contém detalhes da antena GPS usada para a ocupação do ponto observado.

Altura

Exibe a altura da antena. Se a altura foi inserida incorretamente durante a ocupação, use o teclado para inserir um valor para mudar este campo.

Tipo

Exibe o tipo de antena conectada ao receptor. Se a antena foi inserida incorretamente durante a ocupação, selecione um tipo de antena da lista para mudar este campo.

Medido para

Exibe até onde a altura da antena é medida. Se o método foi inserido incorretamente durante a ocupação, selecione uma opção da lista para mudar este campo.


Janela Propriedades - guia Levantamento - página de Configuração do instrumento

Use a página Configuração do instrumento para visualizar e corrigir os detalhes de configuração do instrumento convencional usado para a observação.

Para acessar esta página a partir da janela de Propriedades:

1.	Selecione a guia Levantamento

2.	Com um ponto selecionado, clique o botão do menu Ocupações e configurações [image].

NOTA: Se houver mais de uma ocupação ou configuração para o ponto, aparece um menu de atalho. Selecione a página Configuração do instrumento que deseja visualizar. Todas ocupações para o ponto, tanto GPS como terrestre, podem ser visualizadas nesta página.

Ponto instrumento

Exibe o nome do ponto do qual a observação foi tomada.

Altura do instrumento

Exibe a altura do instrumento quando a observação foi tomada. Se a altura foi inserida incorretamente durante a configuração, use o teclado para inserir um valor para mudar este campo.

Ponto VA

Exibe o nome do ponto de visada atrás observado.

Azimute VA

Exibe o azimute computado para a visada atrás observada.

NOTA: Se o ponto de visada atrás possui coordenadas, estas coordenadas são usadas para determinar o azimute para o ponto de visada atrás. Se um azimute digitado também existir, a qualidade do azimute digitado é comparada com o azimute comparado com o azimute usando as coordenadas do ponto de visada atrás e o azimute de mais alta qualidade é usado. Se a qualidade do azimute computado e o azimute digitado for a mesma, o azimute computado é usado.


Janela Propriedades - guia Levantamento - página Configuração do alvo

Use a página Configuração do alvo para visualizar e corrigir detalhes do alvo usado para a observação convencional.

Para acessá-lo, na janela de Propriedades:

1.	Na guia Levantamento, selecione a observação convencional.

2.	Clique o botão do menu Configuração do alvo [image] para visualizar os detalhes de configuração do alvo.

Ponto VF

Exibe o nome do ponto de mira anterior.

Altura do alvo

Exibe a altura do alvo quando a observação de mira anterior foi tomada. Se a altura foi inserida incorretamente durante a configuração, use o teclado para inserir um valor para mudar este campo.

Constante do prisma

Exibe a constante do prisma do alvo que é aplicado à observação. Se a constante não foi inserida ou foi inserida incorretamente durante a configuração, use o teclado para inserir um valor para mudar este campo.

O campo não pode conter ‘?’ porque a observação já teve uma constante de prisma aplicada ao arquivo e o arquivo não especifica o que a constante é. Se um erro ocorreu durante a configuração e a constante do prisma foi inserida incorretamente, aplique a diferença entre a constante do prisma inserida no campo e a constante que deveria ter sido entrada. Por exemplo, se você inseriu “20” no campo, mas deveria ter inserido “5”, insira uma correção de “–15” no campo de constante do prisma.


Janela Propriedades - guia Levantamento - página Coordenada GPS (APC)

Use a página Coordenada GPS (APC) para visualizar uma solução da posição GPS. Uma solução da posição pode ser obtida de:

  GPS diferencial

  Sistema de Aumento de Áreas Estendidas (WAAS)

  	Usando a tecla [image] no Trimble Survey Controller

Posições autônomas

VRS – RTK de área mais larga RTK (fixo e flutuante)

Soluções de posição serão exibidas para um ponto se eles forem de qualidade levantamento ou mapeamento. Pode-se obter mais de uma solução de posição, mas estes valores não podem ser editados.

Para acessar a página, na janela Propriedades:

1.	Na janela de gráficos, clique duas vezes o ponto que inclui uma Coordenada GPS (APC).

2.	Estenda o ponto da árvore da janela Propriedades.

3.	Selecione o C?soln da estrutura da árvore [image], onde ? indica o número da coordenada.

Aparece a página Coordenada GPS (APC).

Ponto

Exibe o nome do ponto.

Latitude, Longitude, Altura

Exibe as coordenadas WGS-84 e as qualidades do ponto determinadas para o ponto.

NOTA: A altura exibida é a altura do Centro de Fase da Antena da antena GPS usada para a ocupação. A altura da antena não é aplicado.

Tipo de processador

Exibe o método de processamento. Por exemplo, WAAS, RTK de área larga.

Status

Exibe o status da solução da posição. O status é considerado por uma recomputação, ou quando uma computação de levantamento é efetuada. Para mudar este campo, clique a seta e selecione a opção da lista suspensa que quer aplicar ao ponto.


Janela Propriedades - guia Levantamento - página Coordenada

Mais informações

 Ver também

Pode-se usar a página Coordenada para visualizar as coordenadas de um ponto selecionado. Também pode-se usá-la para mudar as qualidades e status das coordenadas.

Um ponto pode ter uma coordenada WGS-84, uma coordenada grid/local e coordenadas ajustadas. Uma coordenada ajustada pode ocorrer depois de ter efetuado um ajuste de rede (se tiver instalado o módulo de Ajuste da Rede).

Use a página Resumo para visualizar as coordenadas para o ponto.

Para acessar a página da coordenada:

1. 	Na janela gráficos, clique duas vezes no ponto. Aparece a janela de Propriedades.

2. 	Expanda a árvore para o ponto e selecione a coordenada.

As coordenadas para o ponto são exibidas.

Campos da Coordenada

Exibe os valores componentes da coordenada do ponto e as qualidades qualidades designadas a elas. Os campos de coordenada exibidos dependem da opção de visualização configurada e somente são editáveis se a visualização atual for a mesma do tipo de coordenada salvada..

Grid / Local / WGS-84

Seleciona a opção de visualização da coordenada para o ponto.

NOTA: Se a opção de visualização for configurada para WGS-84, os campos de coordenada exibidos vão depender do que é configurado em Apresentar WGS-84 como na guia Unidades e formato do diálogo Propriedades do projeto. Por exemplo, se o campo Apresentar WGS-84 como for configurado para X,Y,Z, o campo coordenadas da página Resumo aparece como X,Y,Z. Se o campo Exibir WGS-84 como for configurado para L,L,A, os campos de WGS-84 são etiquetados como Latitude, Longitude e Altura.

Controle do seletor de qualidade

Use o controle do Seletor de qualidade para designar uma qualidade ao componente da coordenada. As qualidades são listadas na ordem descendente:

  Controle

  Levantamento

  Mapeamento

 Desconhecido

Status

Exibe o status do ponto selecionado. O status de um ponto é considerado por uma recomputação, ou quando efetua-se uma computação de levantamento. Para mudar este campo, clique a seta e selecione a opção da lista suspensa que deseja aplicar ao ponto.

Desative uma coordenada se não desejar que ela seja usada para derivar a posição do ponto.

Ative uma coordenada como uma verificação se somente desejar que a coordenada usada se não houverem outras observações ou coordenadas que podem ser usadas para derivar a posição do ponto.

O relatório Recomputar apresentará um relatório sobre as coordenadas ativadas como verificação, mas não sobre as coordenadas desativadas.

Tipo de coordenada

As coordenadas são salvadas no banco de dados no tipo de coordenada selecionada. Se salvar a coordenada como um tipo diferente, toda coordenada existente com o mesmo tipo será substituída.


Janela Propriedades - guia Levantamento - Observações GPS

Pode-se visualizar as informações em qualquer tipo de observação GPS tal como vetores RTK, Estático, FastStatic e cinemático pós-processado.

Use a guia Levantamento da janela Propriedades para visualizar e editar as informações relacionadas ao levantamento da observação GPS selecionada. As informações de levantamento são organizadas em páginas.

Pode-se acessar as seguintes páginas clicando o botão do menu apropriado:

Resumo
Aviso
Ocupação a base
Ocupação do rover
Observação
Estatísticas da observação


Janela Propriedades - guia Levantamento - página Resumo (Observações GPS)

A página Resumo é um resumo dos detalhes de observação da observação GPS selecionada na janela Propriedades.

1. 	Selecione uma observação GPS na visualização Levantamento

2. 	Para acessá-la, na janela Propriedades, clique o botão do menu Resumo [image].

De

Exibe o nome do ponto de referência da qual o observação foi feita.

Para

Exibe o nome do ponto rover para a qual o observação é feita.

Hora

Exibe o período de tempo da observação e quando ela foi iniciada.

NOTA: Durante a importação de dados, os horários de Início e de Fim são convertidos do Horário GPS para UTC (Horário Universal Coordenado – ou o Horário de Greenwich). Os horários são então exibidos como horários locais usando o grupo do fuso horário configurado no Microsoft Windows.

SUGESTÃO: Coloque o ponteiro sobre o campo para exibir uma dica de ferramentas do tempo de parada da ocupação.

Tipo de processador

Exibe o tipo de processador da observação selecionada. A classificação relaciona-se ao processador usado para determinar a solução da observação. A classificação relaciona-se ao processador usado para determinar a solução da observação. O campo tipo de processador pode ser:

  RTK

  Estático ou FastStatic

  PPCinemático

  Não processado : indica que a solução da observação pode ser, mas não foi, determinada pelo processador da linha da base.

Método do campo

Exibe o método de levantamento GPS usado para a observação.

  Topo

  Contínuo

  Controle observado

  Rápido

  Estático ou FastStatic

  Evento

  Parar e Ir

Status

Exibe o status da observação selecionada. O status de uma observação é considerado por recomputação, ou quando efetua-se uma computação de levantamento. Use este campo para desativar más observações (tais como quando a observação produz um fechamento forçado).

Para mudar este campo, clique a seta e selecione a opção da lista suspensa que deseja aplicar para a projeção.

Desative um observação se não quiser usá-la para derivar a posição do ponto.

Ative uma observação como uma verificação se somente quiser que a observação usada se não houverem outras observações ou coordenadas que podem ser usadas para derivar a posição do ponto.

O relatório Recomputar apresentará um relatório sobre observações ativadas como verificação mas não sobre observações desativadas.

Usar no ajuste da rede

Desmarque esta caixa de seleção se não quiser que a observação selecionada seja usada num ajuste de rede (se tiver instalado o módulo de Ajuste da Rede), mas que seja usada quando o banco de dados seja computado por recomputação.

Se a observação não possuir informações sobre a covariância ou informações de erro padrão, esta opção não é ativada.

Se a observação for desativada, esta opção não será disponível.


Janela Propriedades - guia Levantamento - página Observação (Observações GPS)

Use a página Observação para selecionar a solução ativa e visualizar os componentes da linha de base para a observação selecionada.

1. 	Selecione a linha da base da visualização Levantamento

2. 	Para acessá-la, na janela Propriedades, clique o botão do menu de Observação [image].

Solução ativa

Exibe a solução ativa da linha da base. Se tiver processado a linha de base mais de uma vez (quando o módulo de Processamento da linha de base é instalado) usando diferentes estilos de processamentos, e tiver escolhido não sobrescrever soluções duplicadas da linha da base no diálogo de processamento GPS, a linha de base pode ter mais de uma solução. No entanto, a linha de base somente pode ter uma solução ativa. Esta é a solução usada numa recomputação e um ajuste de rede. Clique a seta e selecione a melhor solução da lista suspensa que queira ativa para a observação.

SUGESTÃO: Mantenha o ponteiro sobre as soluções para exibir uma dica de ferramentas dos resultados da linha da base.

Tipo de solução

Exibe o tipo de solução da observação da seleção selecionada.

dX, dY, dZ

Exibe os valores de delta da linha de base GPS em função do sistema de coordenadas Cartesiano WGS-84 quando a opção de apresentação estiver configurada para XYZ.

Azimute p/frente SN, Distância do elipsóide, Altura do delta

Exibe os componentes da linha de base GPS em função do elipsóide local quando a opção de visualização for configurada para Geodésico.

NOTA: O azimute p/frente SN refere-se ao azimute para frente da seção normal (geodésica) na direção do ponto de referência para o ponto rover.

dN, dL, dC

Exibe os valores do delta Norte, Leste e Para cima do horizonte geodésico local quando a opção de visualização é configurada para NLC.

Mostrar detalhes de chão para chão

Marque esta caixa de seleção para mostrar os valores do componente da linha da base reduzidos para as alturas do solo das marcas ocupadas pelos receptores nos pontos de referência e rover.

Se a caixa de seleção for desmarcada, os valores do componente da linha de base são mostrados do centro de fase da antena de referência ao centro de fase da antena rover. A seguinte figura ilustra esta diferença.


Janela Propriedades - guia Levantamento - Página de observação (Solução da posição)

Use a página de Observação para selecionar a solução ativa e os componentes da linha base para a observação selecionada:

1.	Selecione a linha de base na visualização do levantamento.

2.	Para acessá-la, na janela Propriedades, clique o botão do menu Observação [image].

Tipo de processador

Exibe o método de processamento. Por exemplo, WAAS ou RTK de área larga.

Campo Método

Mostra o método do campo usado, por exemplo, contínuo.

Tipo de solução

Exibe o tipo de solução da observação da seleção selecionada, por exemplo, flutuante L1.


Janela Propriedades - guia Levantamento - página Estatísticas da observação (Observações GPS)

A página de Estatísticas da observação exibem as estatísticas de solução apropriada e indicadores de qualidade dependendo do tipo de observações da linha de base. As estatísticas são diferentes para um observação RTK que para uma observação estática/pós-processada.

Use esta página para verificar a qualidade da solução.

1. 	Selecione a linha de base na visualização Levantamento

2. 	Para acessá-la, na janela Propriedades, clique o botão do menu de Estatísticas das Observação [image].

Se estiver visualizando uma observação RTK, aparecem os seguintes campos da página Estatísticas da observação:

Número de medições

Exibe o número de medições (épocas) tomadas para completar a observação.

Número mínimo de satélites

Exibe o número mínimo de satélites rastreados pelos receptores de referência e rover durante a observação.

RMS

Exibe a Raiz Quadrada Média (RMS). O valor da RMS mostra a precisão das medições usadas para determinar a solução da linha da base.

Distância declive

Exibe a distância do declive da observação.

Precisão horizontal

Exibe a precisão horizontal das medições usadas para determinar a solução da observação.

Precisão vertical

Exibe a precisão vertical das medições usadas para determinar a solução da observação.

PDOP/RDOP

Exibe o valor da Diluição da Precisão da Posição (PDOP) para as linhas de base cinemáticas, ou o valor da Diluição Relativa da Precisão (RDOP) para linhas de base estática. RDOP diminui com o passar do tempo.

Se estiver visualizando uma linha de base pós-processada, aparecem os seguintes campos da página Estatísticas da observação:

Índice

Exibe o índice de duas variâncias gerados na busca de inteiros do processador que melhor condiz com as medições.

Variância de referência

Exibe a variância de referência. A variância de referência é um indicador de quanto os dados observados para a linha de base condizem com a solução computada.

RMS

Exibe a Raiz Quadrada Média. O valor da RMS expressa a precisão das medições usadas para determinar a solução da linha de base.

Distância declive

Exibe a distância do declive da observação.

Precisão horizontal

Exibe a precisão horizontal das medições usadas para determinar a solução da observação.

Precisão vertical

Exibe a precisão vertical das medições usadas para determinar a solução da observação.

RDOP

Exibe o valor da Diluição Relativa da Precisão.


Janela Propriedades - guia Levantamento - Página de estatísticas do observação (Solução do posição)

A página Estatísticas de observações exibe as estatísticas de solução apropriada e tipo de indicador de qualidade.

Use esta página para verificar a qualidade da solução:

1.	Selecione a linha de base na visualização do Levantamento.

2.	Para acessá-la, na janela Propriedades, clique o botão do menu de Estatísticas de observações [image].

Precisão horizontal

Exibe a precisão horizontal das medições usadas para determinar a solução da posição.

Precisão vertical

Exibe a precisão vertical das medições usadas para determinar a solução da posição.

RMS

Exibe o Valor Médio Quadrático (RMS). O valor RMS mostra a precisão das medições usadas para determinar a solução da linha de base.

PDOP

Exibe o valor da Precisão de diluição da posição (PDOP) para linhas de base.

Número mínimo de satélites

Exibe o número mínimo de satélites rastreados durante a observação.

Número de posições GPS

Mostra o número de posições GPS usadas na solução.


Janela Propriedades - guia Levantamento - Observações convencionais

Pode-se visualizar as informações em qualquer observação terrestre medida no campo usando um instrumento convencional tal como uma estação total ou teodolito.

Use a guia Levantamento da janela Propriedades para visualizar as informações relacionadas ao levantamento da observação convencional selecionada e para editar os detalhes de configuração. As informações estão organizadas em páginas.

Pode-se acessar as seguintes páginas, clicando o botão do menu apropriado:

Resumo
Configuração do alvo
Observação
Estatísticas da observação
NOTA: Uma observação convencional é mostrada na estrutura da árvore na seguinte ordem: nome do ponto da visada atrás, nome do ponto do instrumento e nome do ponto da visada atrás.


Janela Propriedades - guia Levantamento - página Resumo (Observações convencionais)

A página Resumo traz um resumo dos detalhes da observação da observação convencional selecionada na janela Propriedades.

1. 	Selecione a observação na visualização Levantamento

2. 	Para acessá-la, na janela Propriedades, clique o botão do menu Resumo [image].

Ponto do instrumento

Exibe o nome do ponto usado para a configuração do instrumento do qual a observação foi feita.

Altura do instrumento

Exibe a altura do instrumento.

Ponto da visada atrás

Exibe o nome do ponto usado como a visada atrás.

Ponto visada adiante

Exibe o nome do ponto do alvo para o qual a observação é feita.

Status

Exibe o status da observação selecionada. O status de uma observação é considerado por recomputação, ou quando uma computação de levantamento é efetuada.

Para mudar este campo, clique a seta e selecione a opção da lista suspensa que queira aplicar à observação.

Desative uma observação se não quiser usá-la para derivar a posição do ponto.

Se a observação é uma verificação de um ponto de visada atrás, ative a observação como uma verificação. Isso garantirá que um fechamento será especificado mas a observação não será usada para determinar a coordenada.

O relatório de Recomputar apresentará um relatório sobre as observações ativadas como verificação mas não sobre operações desativadas.

Usar no ajuste da rede

Se não quiser que a observação selecionada usada num ajuste da rede (se tiver instalado o módulo de ajuste da rede), mas quiser usá-lo numa recomputação, desmarque esta caixa.


Janela Propriedades - guia Levantamento - página Observação (Observações Convencionais)

Use a página Observação para visualizar os componentes da observação entre o instrumento e as configurações do alvo para a observação selecionada.

1. 	Selecione a observação na visualização do Levantamento

2. 	Para acessá-la, na janela Propriedades, clique o botão do menu Observação [image].

Azimute de visada atrás

Exibe o azimute computado e a qualidade entre o ponto do instrumento e o ponto de visada atrás.

NOTA: Se o ponto de visada atrás possuir coordenadas, estas coordenadas são usadas para determinar o azimute para o ponto de visada atrás. Se também existir um azimute digitado, a qualidade do azimute digitado é comparada com o azimute computado usando as coordenadas do ponto de visada atrás e é usado o azimute de maior qualidade. Se a qualidade do azimute computado e o azimute digitado forem o mesmo, o azimute computado será usado.

Ângulo horizontal, Ângulo vertical, Distância declive

Exibe os valores observados dos componentes da observação quando a opção de visualizar está configurada para AH,AV,DD.

Azimute, Distância horizontal, Elevação do delta

Exibe valores dos componentes da observação reduzidos para o sistema de coordenada do grid quando a opção de visualização é configurada para AZ,DH,DV.

NOTA: Durante a importação, as correções atmosféricas e correções da curvatura e refração são aplicadas à observação. A observação horizontal é reduzida a um ângulo do ponto de visada atrás. O ângulo vertical é corrigido para curvatura e refração. A correção PPM é aplicada à distância do declive.

Tipo de observação

Exibe a face (um, dois) do instrumento usado quando a observação foi tomada ou, se as observações da face um e face dois tiveram sua média tirada. Uma observação com média tirada é a média de um par de face um/face dois, observada entre o ponto de visada atrás e o ponto observado na mesma configuração.

A observação também pode derivar de um ângulo médio virado do Trimble Survey Controller (por exemplo quando voltas são observadas).

Mostrar detalhes de chão para chão

Marque esta caixa de seleção para mostrar as observações reduzidas às alturas do solo das marcas que são ocupadas pelo ponto do instrumento e o ponto de visada adiante.


Janela Propriedades - guia Levantamento - Observações do nível

Pode-se visualizar informações em qualquer observação de nível medida no campo. Para visualizar informações relacionadas a levantamento de uma observação de nível selecionada, use a guia Levantamento da janela Propriedades.

A informações da guia Levantamento são organizadas em páginas. Para acessar uma página, clique o botão de menu apropriado como ilustrado abaixo:

Resumo
Estatísticas da Statistics

NOTA: Se desejar efetuar um ajuste de rede usando dados de observação do nível, deve-se ter definidos os erros padrões para as observações de nível. Erros padrões são calculados nos seguintes casos:

  Se importar dados de nível digital, o erro padrão é calculado usando o número de vezes e o erro durante a leitura de empregados no diálogo Estilo do ajuste (guia Controles terrestre).

  Ao importar dados de nível de importação no Formato Trimble Data Exchange. Se incluir o número de vezes no Formato Trimble Data Exchange, o erro padrão da elevação delta é calculado com base no número de vezes. Se incluir o valor de erro padrão da elevação delta no Formato Trimble Data Exchange, este valor será usado.

Se um erro padrão não for definido ou computado, as observações do nível não são disponíveis para o ajuste.

Pode-se dar entrada de erro padrão para cada observação, na janela Propriedades.


Janela Propriedades - guia Levantamento - página Resumo (Observações do nível)

A página Resumo da janela Propriedades apresenta um resumo dos detalhes da observação de um nível de observação selecionado.

1. 	Selecione o nível de observação

2. 	Para acessar a página, na janela Propriedades, clique o botão do menu Resumo [image].

Do Pt

Exibe o nome do ponto de onde iniciou a execução do nível.

Ao Pt

Exibe o nome do ponto onde termina a execução do nível.

Elevação do delta

Exibe a mudança na elevação entre o pontos “de” e “para”.

Status

Nesta lista, selecione o status que a observação deve ter. Este status é considerado durante recomputações, ou computações de levantamento.

Se a observação é uma verificação num ponto, ative a observação como uma verificação. Isso garante que um fechamento seja especificado mas a observação não será usada para determinar a elevação. Se não desejar que a observação usada determine a posição de um ponto, desative-a.

O relatório Re-computar aparece ativado como observações de nível de verificação, mas não observações desativadas.


Janela Propriedades - guia Levantamento - página Estatísticas da observação (Observações do nível)

A página Estatísticas das observações exibem as estatísticas apropriadas e os indicadores de qualidade

Para acessá-la, na janela Propriedades:

Na guia Levantamento, clique o botão do menu Estatísticas da observação [image].

Erro padrão (Elev Delta)

Este valor exibe o erro padrão da Elevação delta. O erro não é computado quando se:

  importam arquivos de nível digital (o erro padrão da elevação delta é calculado com base no número de vezes e erro durante a leitura da régua de nivelar).

  importam dados de nível no Formato Trimble Data Exchange. Se incluir o número de vezes no Formato Trimble Data Exchange, o erro padrão da elevação é calculado com base no número de voltas. Se incluir o valor do erro padrão da elevação delta no Formato Trimble Data Exchange, usa-se este valor.

Pode-se também inserir seu próprio erro padrão.

Número de vezes

É o número de configurações do instrumento para determinar a elevação delta entre dois pontos.

Comprimento da linha

É o comprimento do círculo do nível. É calculado através da adição das distâncias da visada atrás e da visada adiante.


Janela Propriedades - guia Levantamento - Observações do telêmetro a laser

Pode-se visualizar as informações completas de qualquer observação terrestre medida no campo usando um instrumento de telêmetro a laser.

Use a janela Propriedades da guia Levantamento para visualizar e editar as informações relacionadas ao levantamento da observação selecionada do telêmetro a laser. As informações do levantamento são organizadas em páginas.

Pode-se acessar as seguintes páginas, clicando o botão de menu apropriado:

Resumo
Observação


Janela Propriedades - guia Levantamento - página Resumo (Observações do telêmetro a laser)

A página Resumo apresenta um resumo dos detalhes da observação da observação selecionada do telêmetro a laser na janela Propriedades.

Para acessá-la, na janela Propriedades:

  Na guia Levantamento, clique o botão do menu Resumo [image].

Ponto instrumento

Exibe o ponto onde é feita a observação do telêmetro da laser.

Altura do instrumento

Exibe a altura do instrumento.

Ponto alvo

Exibe o ponto para o qual é feita a observação do telêmetro a laser.

Altura do alvo

Exibe a altura do alvo.

Status

Exibe o status da observação selecionada. O status de uma observação é considerado pela função recomputação, ou quando se executa uma computação de levantamento. Para mudar este campo, clique a seta e selecione a opção da lista suspensa que deve ser aplicada à observação.

Desative uma observação se não quiser que seja usada para derivar a posição do ponto.

Ative uma observação como uma verificação se somente quiser que a observação seja usada se não houverem outras observações ou coordenadas que podem ser usadas para derivar a posição do ponto.

O relatório Recomputar especificará as observações ativadas como verificação, mas não as observações desativadas.


Janela Propriedades - guia Levantamento - página Observação (Observações do telêmetro a laser)

Use a página Observação para visualizar os componentes de observação e para editar a declinação magnética entre as configurações do instrumento e alvo usadas para a observação selecionada.

Para acessá-la, na janela Propriedades:

  Na guia Levantamento, clique o botão do menu Observação

Azimute magnético

Exibe o azimute magnético observado.

Declinação

Exibe a declinação magnética entre o norte magnético e o norte verdadeiro. Este valor é requerido para calcular o azimute verdadeiro. Use o teclado para inserir um valor para mudar este campo.

Ângulo vertical

Exibe o ângulo vertical medido quando a observação é tomada. Se este valor for nulo, considera-se que a distância seja horizontal.

Distância declive

Exibe a distância do declive da observação.


Janela Propriedades - guia Nota

 Perspectiva geral

Registros de nota são entidades não gráficas do banco de dados. Isto é, eles não aparecem e não podem ser selecionados na janela de gráficos.

Use a guia Nota da janela Propriedades para visualizar e editar registros de nota se importou um trabalho do Trimble Survey Controller contendo notas inseridas pelo usuário.

Para acessá-la,

1.	Escolha uma das seguintes opções:

  Selecione / Grupos de seleção. Escolha o arquivo .dc que contém as notas que deseja visualizar.

  Escolha Selecionar / Por pergunta / Notas.

2.	Abra a janela Propriedades.

A janela Propriedades exibe todas entidades da nota com um ícone de lápis [image].


Janela Propriedades - guia CAD (Pontos)

Use a guia CAD da janela Propriedades para visualizar e editar as informações relacionadas ao CAD do ponto selecionado.

Camada

Exibe a camada à qual o ponto selecionado foi designado. Selecione uma camada da lista ou use o teclado para inserir um nome de nova camada para mudar este campo.

Estilo do ponto

Visualize ou selecione o estilo de ponto da lista.

Código de característica

Visualize ou insira o valor do código de característica para o ponto selecionado.

Descrição

Visualize ou insira a Descrição do ponto selecionado.


Janela Propriedades - guia Linha

Use a guia Linhas e edite os campos da entidade de linha selecionada.

Para acessá-la, na visualização do Plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade da linha.

  Selecione a entidade da linha da janela de gráficos e abra a janela Propriedades.

De

Exibe o nome do ponto “de” da linha selecionada. Use o teclado para inserir o nome do ponto a ser mudado neste campo.

Para

Exibe o nome do ponto “para” da linha selecionada. Use o teclado para inserir o nome do ponto a ser mudado neste campo.

Azimute

Exibe o azimute entre o ponto “de” e “para”.

Distância

Exibe a distância entre o ponto “de” e “para”.

Camada

Exibe a camada à qual a entidade da linha é designada. Selecione uma camada da lista ou use o teclado para inserir um nome de nova camada para mudar este campo.

Estilo de linha

Exibe o estilo da linha selecionada. Selecione um estilo de linha na lista para mudar este campo.


Janela Propriedades - guia Curva

Use a guia Curvas para visualizar e editar os campos da entidade da curva selecionada.

Para acessá-la, na visualização do plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade curva.

  Selecione a entidade curva da janela de gráficos e abra a janela Propriedades.

De

Exibe o nome do ponto “de” da curva selecionada. Use o teclado para inserir o nome do ponto para mudar este campo.

Para

Exibe o nome do ponto “para” da curva selecionada. Use o teclado para inserir o nome do ponto para mudar este campo.

Tangente da entrada, Tangente da saída

Exibe as tangentes da curva selecionada. Use o teclado para inserir um valor para mudar estes campos.

Esp linha da curva

Define a largura da curva selecionada. Insira um valor entre 0 e 1 para mudar este campo.

Camada

Exibe a camada à qual a entidade da curva selecionada é designada. Selecione uma camada da lista ou use o teclado para inserir um nome de nova camada para mudar este campo.

Estilo de linha

Exibe o estilo de linha da curva selecionada. Selecione um estilo de linha da lista para mudar este campo.


Janela Propriedades - guia Arco

Use a guia Arco para visualizar e editar os campos do arco selecionado.

Para acessá-la, na visualização do Plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade do arco.

  Selecione a entidade do arco da janela de gráficos e abra a janela Propriedades.

De

Exibe o nome do ponto “de” do arco selecionado. Use o teclado para inserir o nome do ponto para mudar este campo.

Para

Exibe o nome do ponto “para” do arco selecionado. Use o teclado para inserir o nome do ponto para mudar este campo.

Centro

Exibe o nome do ponto “centro” do arco selecionado. Use o teclado para inserir o nome do ponto para mudar este campo.

Norte, Leste

Exibe as coordenadas no ponto central do arco. Use o teclado para inserir valores para mudar estes campos.

NOTA: Se o ponto central foi definido para o arco, as coordenadas não são usadas. O ponto central é usado.

Camada

Exibe a camada à qual a entidade do arco é designada. Selecione uma camada da lista ou use o teclado para inserir um nome de camada nova para mudar este campo.

Estilo de linha

Exibe o estilo de linha do arco selecionado. Selecione um estilo de linha da lista para mudar este campo.

Arco tem menos de 180 graus

Esta caixa de seleção está marcada por padrão. Desmarque-a para aplicar o ângulo do arco selecionado para que seja mais de 180 graus.


Janela Propriedades - guia Anotação do ponto

Use a guia Anotação do ponto para visualizar e editar os campos da entidade de anotação selecionada designada para um ponto.

Para acessá-la, na visualização do Plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade da anotação.

  Selecione a entidade da anotação da janela de gráficos e abra a janela Propriedades.

Ponto

Exibe o nome do ponto ao qual a entidade de anotação selecionada é designado.

Expressão do texto

Exibe a expressão do texto da entidade da anotação selecionada. A expressão do texto pode ser uma definição do texto ou um código de campo inserido no modelo da anotação. Use o teclado para inserir um valor para mudar este campo.

Leste, Norte

Exibe as coordenadas com respeito à posição da âncora padrão “esquerda da linha da base” da entidade da anotação selecionada. Use o teclado para inserir valores para mudar estes campos.

Orientação

Exibe a orientação para a entidade da anotação. Use o teclado para inserir um valor para mudar este campo.

Camada

Exibe a camada para a qual a entidade de anotação é designada. Selecione uma camada da lista ou use o teclado para inserir um nome de camada nova para mudar este campo.

Estilo de texto

Exibe o estilo do texto da entidade da anotação selecionada. Selecione um estilo de texto da lista para mudar este campo.


Janela Propriedades - guia Anotação da linha

Use a guia anotação da linha para visualizar e editar os campos da entidade da anotação selecionada designada a uma entidade da linha.

Para acessá-la, na visualização do Plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade da anotação.

  Selecione a entidade da anotação da janela de gráficos e abra a janela Propriedades.

Linha

Exibe os nomes dos pontos que são usados para definir a linha à qual a entidade da anotação é designada.

Expressão do texto

Exibe a expressão do texto da entidade da anotação selecionada. A expressão do texto pode ser uma definição do texto ou um código de campo inserido no modelo da anotação. Use o teclado para inserir um valor para mudar este campo.

Leste, Norte

Exibe as coordenadas com respeito à posição da âncora padrão “esquerda da linha da base” da entidade da anotação selecionada. Use o teclado para inserir valores para mudar estes campos.

Orientação

Exibe a orientação para a entidade da anotação. Use o teclado para inserir um valor para mudar este campo.

Camada

Exibe a camada para a qual a entidade de anotação é designada. Selecione uma camada da lista para inserir um nome de camada nova para mudar este campo.

Estilo de texto

Exibe o estilo do texto da entidade da anotação selecionada. Selecione um estilo de texto da lista para mudar este campo.


Janela Propriedades - guia Anotação do arco

Use a guia Anotação do arco para visualizar e editar os campos da entidade da anotação selecionada a uma entidade do arco.

Para acessá-la, na visualização do Plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade da anotação.

  Selecione a entidade da anotação da janela de gráficos e abra a janela Propriedades.

Arco

Exibe os nomes dos pontos usados para definir o arco para o qual a entidade da anotação selecionada é designada.

Expressão do texto

Exibe a expressão do texto da entidade da anotação selecionada. A expressão do texto pode ser uma definição do texto ou um código de campo inserido no modelo da anotação. Use o teclado para inserir um valor para mudar este campo.

Leste, Norte

Exibe as coordenadas com respeito à posição da âncora padrão “esquerda da linha da base” da entidade da anotação selecionada. Use o teclado para inserir valores para mudar estes campos.

Orientação

Exibe a orientação para a entidade da anotação. Use o teclado para inserir um valor para mudar este campo.

Camada

Exibe a camada para a qual a entidade de anotação é designada. Selecione uma camada da lista para inserir um nome de camada nova para mudar este campo.

Estilo do texto

Exibe o estilo do texto da entidade da anotação selecionada. Selecione um estilo de texto da lista para mudar este campo.


Janela Propriedades - guia Texto

Use a guia Texto para visualizar e editar os campos da entidade de texto selecionada.

Para acessá-la, na visualização do Plano, escolha uma das seguintes opções:

  Clique duas vezes na entidade do texto.

  Selecione a entidade de texto da janela de gráficos e abra a janela Propriedades.

Expressão do texto

Exibe a expressão do texto da entidade de texto selecionada. A expressão do texto pode ser uma definição do texto ou um código de campo inserido. Use o teclado para inserir um valor para mudar este campo.

Leste, Norte

Exibe as coordenadas com respeito ao tipo de âncora especificada da entidade de texto selecionada. Use o teclado para inserir valores para mudar estes campos.

Orientação

Exibe a orientação para a entidade do texto. Use o teclado para inserir um valor para mudar este campo.

Camada

Exibe a camada para a qual a entidade do texto é designada. Selecione uma camada da lista ou use o teclado para inserir um nome de camada nova para mudar este campo.

Estilo de texto

Exibe o estilo do texto da entidade de texto selecionada. Selecione um estilo de texto da lista para mudar este campo.


Janela Propriedades - guia Atributos

Use a guia Atributos da janela Propriedades para administrar os atributos do projeto. A janela Propriedades lhe permite revisar, editar, adicionar e apagar atributos no Trimble Geomatics Office.

Para acessá-la, na janela Propriedades, selecione a guia Atributo.

NOTA: Deve-se configurar o projeto para atributos para que a guia Atributos seja disponível.

Ferramenta Seleção do atributo

A ferramenta Seleção do atributo exibe o atributo atual selecionado para o ponto. Se o ponto tiver mais de uma atributo associado a ele, clique a seta e selecione o atributo da lista suspensa que deseja visualizar.

Nome do atributo

Exibe os nomes de todas propriedades do atributo selecionado associados ao ponto selecionado.

Valor

Exibe os valores de todas propriedades de atributo selecionadas associados ao ponto selecionado. Para editar um valor de atributo, clique o campo apropriado e selecione um valor da lista; ou use o teclado para  inserir um valor no campo se uma lista de menu não for disponível.


Janela Propriedades - guia Geral

A guia Geral da janela Propriedades é exibida quando se abre a janela Propriedades sem selecionar nenhuma entidade, ou tiver mais de uma entidade realçada na lista de seleção da janela Propriedades.

A guia Geral exibe a mensagem “Nenhuma propriedade é disponível”.

Para visualizar as propriedades de uma entidade, selecione uma entidade da janela de gráficos ou da lista de seleção da janela Propriedades.


Janela Propriedades - guia Levantamento - Observações reduzidas

Pode-se visualizar as informações completas sobre observações terrestres reduzidas tais como offsets que foram medidos no campo usando o Trimble Survey Controller.

Use a guia Levantamento para visualizar e editar as informações relacionadas ao levantamento na observação selecionada. As informações do levantamento são organizadas em páginas.

Para acessar a página da guia Levantamento, clique um botão do menu. As seguintes páginas podem ser acessadas:

Resumo
Observação


Janela Propriedades - guia Levantamento - página Resumo (Observações reduzidas)

A página Resumo apresenta um resumo dos detalhes das observações reduzidas selecionadas na janela Propriedades.

Para acessá-la, na janela Propriedades:

  Na guia Levantamento, clique o botão da página Resumo

De

Exibe o nome do ponto do qual as medições foram tomadas.

Para

Exibe o nome do ponto para o qual as medições são tomadas.

Status

Exibe o status da observação offset selecionada. O status de uma observação é considerada pela função recomputação, ou quando uma computação de levantamento é efetuada. Para mudar este campo, clique a seta e selecione a opção da lista suspensa que deve ser aplicada à observação.


Janela Propriedades - guia Levantamento - página Observação (Observações reduzidas)

Use a página Observação para visualizar os componentes da observação da observação reduzida.

Para acessá-la, na janela Propriedades:

  Na guia Levantamento, clique o botão do menu Observação [image].

Azimute

Exibe o azimute observado.

Distância horizontal

Exibe a distância horizontal medida da observação.

Distância vertical

Exibe a distância vertical medida da observação.


Coordenadas - Perspectiva geral

Mais informações

 Ver também

Ao inserir coordenadas conhecidas para um ponto num projeto Trimble Geomatics Office, uma coordenada é armazenada com outros dados de levantamento para o ponto. Cada ponto pode ter, no máximo, uma coordenada WGS-84 inserida pelo usuário e uma coordenada de grid/local.

Se editar uma coordenada inserida pelo usuário, a coordenada antiga é substituída pela nova.

Pode-se inserir coordenadas para pontos existentes usando:

  Janela Propriedades / botão Adicionar nova coordenada

  Diálogo Pontos (se possuir instalado o módulo de Ajuste da Rede)

  A importação de um arquivo com coordenadas para pontos que já existem no banco de dados.

Pode-se inserir coordenadas para novos pontos com coordenadas digitadas usando:

  Diálogo Inserir pontos

  Importação de um arquivo com coordenadas para pontos que ainda não existem no banco de dados.

Todas coordenadas inseridas no Trimble Geomatics Office são adicionadas como coordenadas de suporte para o ponto e podem ser visualizadas em páginas separadas de coordenadas na janela Propriedades.

NOTA: Para visualizar a posição do ponto, use página Resumo. A coordenada inserida será usada para posicionar o ponto se ele tiver a mesma qualidade (ou de qualidade maior) que as observações do ponto.


Janela Propriedades - guia Piquetagem - Perspectiva geral

A guia Piquetagem exibe informações sobre pontos que foram piquetados no campo usando o Trimble Survey Controller. As seguintes páginas são disponíveis na etiqueta Piquetagem:

  Deltas Como Piquetados

  Detalhes lineares

  Ponto de encontro

  Painel da história

  MTD


Janela Propriedades - guia Piquetagem - página Deltas Como Piquetados

Use a página Deltas Como Piquetados para visualizar as diferenças entre o local do ponto do desenho e ponto piquetado.

Para acessá-lo, na janela Propriedades:

  Na guia Piquetado, clique o botão do menu Deltas Como Piquetados [image].

Método

Este campo ilustra o elemento piquetado. Por exemplo, um ponto, uma linha, um arco ou uma estrada.

Se a opção Polar é selecionada, os seguintes campos são exibidos:

Azimute

Este campo exibe o azimute do ponto do desenho para o ponto de piquetagem.

Comprimento

Este campo exibe a distância do ponto do desenho ao ponto piquetado.

Se a opção Deltas do grid for selecionada, os seguintes campos são exibidos:

Delta dir. Norte

Este campo mostra a diferença do norte entre o ponto do desenho e o ponto piquetado.

Delta dir. Leste

Este campo mostra a diferença do leste entre o ponto do desenho e o ponto piquetado.

Se a opção Estação e offset for selecionada, os seguintes campos são exibidos.

Estação Delta

Este campo mostra a diferença na distância (paralela à linha central do desenho) entre o ponto do desenho e o ponto piquetado.

Offset do Delta

Este campo mostra a diferença na distância (nos ângulos retos à linha central do desenho) entre o ponto do desenho e o ponto piquetado.

Elevação do Delta

Este campo mostra a diferença na elevação entre o ponto do desenho (no ponto a ser piquetado) e o ponto piquetado.

Corte/Aterro

Este campo mostra a diferença na elevação entre o ponto do desenho (no ponto que foi piquetado) e o ponto piquetado.

Os valores da elevação do delta e de corte/aterro serão os mesmos, a não ser que:

  A superfície do desenho não seja um plano horizontal, e

  Não haja um erro significativo no erro horizontal ao piquetar um ponto

A seguinte figura mostra a diferença entre a elevação delta e corte/aterro quando a superfície do desenho não é um plano horizontal.

Se o ponto piquetado foi um ponto de encontro, os deltas especificados são da posição piquetada para o ponto de encontro calculado.


Janela Propriedades - guia Piquetagem - Detalhes lineares

Use a página Detalhes lineares para visualizar os detalhes de piquetagem da característica linear (por exemplo, uma linha, um arco ou uma estrada).

Para acessá-la, na janela Propriedades:

  Na guia Piquetagem, clique o botão do menu Detalhes lineares [image].

Nome

Este campo mostra o nome da característica linear da qual o ponto está sendo piquetado.

Estação

Este campo mostra a estação do desenho para o ponto selecionado para piquetagem.

Offset horizontal

Este campo mostra o offset horizontal do desenho para o ponto piquetado. Para uma estrada, este campo mostra o offset da construção horizontal.

Offset vertical

Este campo mostra o offset vertical do desenho para o ponto piquetado. Para uma estrada, este campo mostra o offset da construção vertical.

Se uma estrada for piquetada, os seguintes campos são exibidos:

Offset do desenho

Este campo mostra o offset do desenho do ponto a ser piquetado.

Elevação do desenho

Este campo mostra a elevação do desenho do ponto a ser piquetado.

Nome da característica

Este campo mostra o nome da característica.

Método de offset horz

Este campo mostra como o offset horizontal foi aplicado. O offset horizontal pode ser aplicado:

  horizontalmente

  no declive do elemento anterior do gabarito


Janela Propriedades - guia Piquetagem - Ponto de encontro

Use a página Ponto de encontro para visualizar os detalhes do ponto de encontro. Esta opção somente é disponível onde o ponto piquetado foi um ponto de encontro numa estrada.

Para acessá-lo, na janela Propriedades:

  Na guia Piquetagem, clique o botão do menu Ponto de encontro [image].

O ponto onde uma superfície do desenho intersecta a superfície natural é conhecido como ponto de encontro. O diagrama abaixo ilustra a seção transversal típica de uma estrada:

Onde:

A = Distância à linha central

B = Distância horizontal do ponto de encontro ao ponto de interseção

C = Distância vertical do ponto de encontro ao ponto de interseção

D = Declive lateral

E = Distância do declive ao ponto de interseção

F = Offset horizontal de construção

G = Largura do rego escavação

H = Ponto de interseção

J = Ponto de encontro

Declive lateral

Este campo mostra o valor do declive lateral.

Largura do rego escavação

Este campo mostra o valor da largura do rego escavação. Ele é ilustrado como “G” no diagrama acima.

Tipo do declive lateral

Este campo mostra o tipo do declive lateral (por exemplo, corte ou aterro).

Distância horz para a linha do centro

Este campo mostra a distância horizontal do ponto de encontro piquetado para a linha do centro.

Elevação

Este campo mostra a elevação como piquetada do ponto de encontro.

Distância horizontal para a articulação

Este campo mostra a distância horizontal do ponto de encontro à articulação.

Distância vertical para a articulação

Este campo mostra a distância vertical do ponto de encontro à articulação.

Distância do declive para a articulação

Este campo mostra a distância do declive do ponto de encontro à articulação.

Dist do declive + offset da construção

Este campo mostra a distância do declive do ponto piquetado ao ponto da articulação. No diagrama acima ele aparece como a distância do declive  do ponto de articulação “H” para um ponto definido. Este ponto é definido através da projeção do declive lateral até que intersecte com a posição piequetada. Este valor é nulo (?) se:

  nenhum offset de construção horizontal for aplicado

  a construção horizontal é aplicada horizontalmente


Janela Propriedades - guia Piquetagem - Painel da história

Use a página Painel da história para visualizar as distâncias do ponto de encontro aos pontos do modelo.

Para acessá-lo, na janela Propriedades:

  Na guia Piquetagem, clique o botão do menu Painel da história [image].

Nome

Este campo mostra o nome do ponto no modelo.

Distância horizontal para o ponto de encontro

Este campo mostra a distância horizontal do ponto de encontro ao ponto do modelo.

Distância vertical do ponto de encontro

Este campo mostra a distância vertical do ponto de encontro para o ponto no modelo.


Janela Propriedades - guia Piquetagem - MTD

Use a página MTD para visualizar os detalhes sobre os pontos piquetados MTD.

Para acessá-la, na janela Propriedades:

  Na guia Piquetagem, clique o botão do menu MTD [image].

Nome do MTD

Este campo mostra o nome do MTD.

Offset vertical

Este campo mostra o offset especificado entre o MTD e a superfície a ser piquetada.

Corte/Aterro

Este campo mostra a diferença em elevação entre o MTD (incluindo o offset vertical) e o ponto piquetado.


Janela Propriedades - guia Levantamento - Observações do azimute

Use a guia Levantamento da janela Propriedades para visualizar e editar observações do azimute. As informações do levantamento são organizadas em páginas.

Pode-se acessar uma página clicando no botão de menu apropriado, como ilustrado abaixo:

Resumo
Aviso
Estatísticas da observação


Janela Propriedades - guia Levantamento - página Resumo (Observações do azimute)

A página Resumo apresenta um resumo dos detalhes da observação da observação de azimute selecionada na janela Propriedades.

1.	Selecione a observação do azimute na visualização do Levantamento

2.	Para acessá-la, na janela Propriedades, clique o botão do menu Resumo [image].

NOTA: Observação do azimute recebem o prefixo AZ.

Do ponto

Exibe o nome do ponto de referência de onde é feita a observação.

Para ponto

Exibe o nome do ponto para o qual a observação do azimute é feita.

Azimute

Este campo exibe o azimute entre os pontos “de” e “para”. Pode-se exibir um azimute anterior de grid ou seção normal. Somente pode-se editar este campo quando os campos Tipo de azimute e Visualização do azimute são os mesmos.

Qualidade

Mostra a qualidade das observações do azimute.

Tipo de azimute

Este grupo mostra se o azimute é armazenado no banco de dados como um grid ou azimute anterior da seção normal. Este campo não pode ser editado.

NOTA: Se o ponto “para” não possuir um azimute, a conversão entre o azimute do grid e o azimute adiante da seção normal não pode ser calculada. Neste caso, o Azimute é exibido como um Nulo (?).

Visualização do azimute

Use estas opções de visualização para selecionar como o azimute é exibido na janela Propriedades:

  Grid – selecione esta opção para exibir o azimute do grid.

  Seção normal para diante – selecione esta opção para exibir o azimute Seção normal para diante

NOTA: Se desejar editar o campo Azimute, as informações do campo Tipo do azimute e nestas opções de visualização devem ser as mesmas.

Status

Nesta lista, selecione o status que a observação deve ter. Este status é considerado durante as recomputações, ou computações de levantamento.

Se somente quiser que um observação seja usada para determinar a posição de um ponto se não houver nenhuma outra observação ou coordenadas disponíveis, ative a observação como uma verificação. Se não quiser que a observação usada determine a posição do ponto (por exemplo, se a observação produz um fechamento forçado), desative-a.

O relatório Re-computar mostra habilitadas as observações de verificação, mas não observações desativadas.

Usar no ajuste da rede

Limpe esta caixa de verificação se não quiser que a observação selecionada seja usada num ajuste de rede (se tiver instalado o módulo de Ajuste da Rede), mas usada quando o banco de dados é recomputado.


Janela Propriedades - guia Levantamento - página Estatísticas da observação (Observações do azimute)

A página Estatísticas da observação apresenta as estatísticas da solução apropriada e indicadores de qualidade, dependendo do tipo de observação selecionado. Para uma observação de azimute, o erro padrão é mostrado. Use esta página para verificar a qualidade da solução.

Para acessá-la, na janela Propriedades:

  Na guia de Levantamento, clique o botão do menu Estatísticas da observação [image].

Erro padrão

Use este campo para inserir o erro padrão da observação do azimute.

NOTA: Um erro padrão de 0°00’00” fixará o azimute do ajuste.


Coordenadas da janela Propriedades

O Trimble Geomatics Office lhe permite adicionar coordenadas para um ponto da janela Propriedades, usando o botão Adicionar coordenada [image]. Ao clicar este botão, aparece um menu de atalho. Neste menu, selecione o tipo de coordenada que deseja adicionar; ou seja, WGS-84, Grid ou Local. As coordenadas salvadas para um ponto e a fonte da coordenada são exibidos na lista da árvore à esquerda na janela Propriedades.

Uma série limitada de coordenadas inseridas pode ser associada a um ponto. Somente pode-se inserir uma coordenada WGS-84 e uma coordenada grid/local para cada ponto. Se já adicionou uma coordenada WGS-84, a opção da coordenada WGS-84 não é disponível.

Somente adicione uma coordenada quando tiver certeza que deseja usar esta coordenada ao invés de observações, porque recomputações usam coordenadas digitadas em preferência à observações da mesma qualidade. Isso garante que um ponto de desenho seja usado em preferência a uma observação de piquetagem.

NOTA: Um prefixo é adicionado ao nome da coordenada inserida para mostrar se a coordenada é um grid (G), local (L) ou uma coordenada WGS-84 (W).

Coordenadas adicionais podem ser geradas pelo Trimble Geomatics Office e armazenadas para um ponto. Estas coordenadas podem incluir:

  coordenadas derivadas de um ajuste

  coordenadas WGS-84 ajustadas salvadas para calibração

Ao adiconar uma coordenada, os componentes de coordenada aparecem como nulo (?). Pode-se usar o botão Inserir valor atual [image] para popular cada campo do componente de coordenada com o valor e qualidade atuais dos componentes da coordenada como mostrado na página Resumo. Este botão somente é disponível quando tiver selecionado o campo do componente da coordenada que deseja popular.

Editando coordenadas

Pode-se editar coordenadas inseridas. No entanto, não é possível editar coordenadas adicionais, tais como coordenadas de ajuste e calibração que o software cria.

Somente pode-se editar componentes de coordenadas se a visualização atual for a mesma da configuração da coordenada em Salvar como. Quando os componentes da coordenada são editados, a fonte é mudada para aquela inserida no escritório, ou várias fontes se somente alguns dos componentes forem editados.

Coordenadas de múltiplas fontes

A fonte de uma coordenada é exibida na janela Propriedades. Se uma coordenada foi derivada de duas ou mais fontes, ele é exibida como de múltiplas fontes. Se uma coordenada derivou de duas ou mais fontes, é mostrada como sendo de múltiplas fontes. Por exemplo, se a coordenada horizontal de um ponto é derivada de um arquivo importado e a altura foi inserida no Trimble Geomatics Office, o ponto aparece como tendo coordenadas derivadas de múltiplas fontes.

SUGESTÃO: Pode-se usar a dica de ferramenta da página de coordenadas para examinar as fontes de cada componente de coordenada.

Movendo coordenadas

Quando uma coordenada é movida ou transformada no Trimble Geomatics Office, todas as observações são desativadas, portanto deve-se reativá-las de quiser computar as coordenadas novamente. Para fazê-lo, use o diálogo Edição múltipla.

Apagando coordenadas

Para apagar uma coordenada, use o botão apagar [image].

NOTA: Coordenadas fixas para ajuste não podem ser editadas.

Qualidade da coordenada

Cada coordenada mostrada na janela Propriedades terá designada a si uma qualidade. As seguintes qualidades de coordenadas podem ser editadas:

  Qualidade de controle

  Qualidade de levantamento

  Qualidade de mapeamento

  Qualidade desconhecida

Não pode-se mudar a qualidade de um ponto de controle fixo.


Janela Propriedades - guia Levantamento - página Eventos

Use a guia Levantamento para visualizar dados de eventos.

Para acessá-la, na janela Propriedades:

  Na guia Levantamento, clique o botão do menu Eventos [image].

ID do evento do receptor

Este campo mostra a ID do evento.

Método de interpolação

Este campo mostra se o método de interpolação é linera ou quadrático.

Pontos no ajuste

Este campo mostra o número de pontos que são usados para ajustar no arco de interpolação.

ID da porta do receptor

Este campo mostra a ID da porta do receptor.

Tipo de solução

Este campo mostra o tipo de solução

RMS

Mostra o valor de RMS.

Status

Nesta lista, selecione o status que a observação deve ter. Este status é considerado durante as recomputações, ou computações de levantamento.


Janela Propriedades - guia Estação e Offset

A guia Estação e Offset exibe informações sobre pontos que foram medidos usando um programa de Estação e Offset num dispositivo da Trimble.

A partir da janela Propriedades:

1.	Selecione a guia Estação e Offset.

2.	Clique o botão Estação/Offset.

Nome

Este campo contém o nome da característica linear.

Estação

Este campo contém a estação na característica linear para o ponto medido.

NOTA: Para o instrumento Trimble 3300, se houver um offset de construção usado a partir da linha de referência, o offset aparece no campo do nome, juntamente com o nome do ponto inicial e final da linha.

Offset

Este campo contém o offset da característica linear para o ponto medido.

Elevação do Delta

Este campo contém a diferença em elevação entre a estação da característica linear e o ponto medido.


    Calibração do Local GPS - Perspectiva geral

Mais informações

Como ...	Diálogo
Perspectiva geral

O processo de calibração do local GPS estabelece o relacionamento entre os dados WGS-84 coletados por receptores GPS e posições de controle local (expressadas como um grid do mapa local com elevações acima do nível do mar). Este relacionamento é definido por uma série de transformações matemáticas. A funcionalidade do calibração do local GPS lhe permite emparelhar o GPS e pontos de controle local a serem usados na calibração (as coordenadas GPS devem ser derivadas de pontos e observações GPS e os pontos do grid devem ser derivados de pontos do grid e observações terrestres). O Trimble Geomatics Office computa, então, e aplica as transformações matemáticas usando quadrados mínimos. Pode-se recalibrar a qualquer momento.

As transformações matemáticas aplicadas para converter as posições WGS-84 para coordenadas do grid são:

1.	Uma transformação do datum para converter a latitude, longitude e coordenadas da altura elipsoidal do WGS-84 para latitude, longitude e coordenadas da altura elipsoidal relativas ao elipsóide do grid do mapa local.

2.	Uma projeção do mapa para converter as coordenadas da latitude e longitude do elipsóide local em coordenadas Norte e Leste do grid do mapa local (o valor da altura não é alterado neste processo).

3.	Um modelo geóide para alturas WGS-84 para tomar uma elevação aproximada acima do nível do mar.

4.	Um ajuste horizontal das coordenadas de grid transformadas para o melhor ajuste dos dados de controle local. Este ajuste permite toda variação local do sistema de projeção que não pode ser satisfeita na transformação geral do datum.

5.	Um ajuste da altura para converter as alturas acima do elipsóide local ou elevações derivadas do geóide para elevações de controle local acima do nível do mar.

Para mudar as configurações da calibração (que definem os mais altos residuais permitidos), use o registro do computador.

O ajuste horizontal e vertical acima armazenados como parte da definição do sistema de coordenadas para o projeto. Todos pontos GPS do banco de dados são atualizados usando os parâmetros de calibração, resultando em valores mais precisos de coordenadas do grid local.

Para salvar a nova definição do sistema de coordenadas (que inclui os parâmetros de calibração) como um local para ser usado em projetos futuros na mesma área, clique Salvar como local no diáogo Calibração.

Se salvar uma calibração como um local com a intenção de usar o local em outro projeto, certifique-se de que a área do projeto está totalmente delimitada pelos pontos usados na calibração. Por exemplo, no seguinte diagrama, é válido usar a definição do local para o projeto B, mas não para o projeto C.

Se usar a tecla [image] no Trimble Survey Controller para iniciar uma base Cinemática em Tempo Real (RTK) e transferir o arquivo do Survey Controller (.dc) ao Trimble Geomatics Office, a posição da base (e, portanto, todos pontos rover da base) será de qualidade desconhecida (para todos componentes, horizontal, altura e elevação).

Se estiver confidente de que a calibração do local GPS melhorou a qualidade dos pontos, use a janela Propriedades para mudar a qualidade do ponto base.

NOTA: Por padrão, se uma calibração do local GPS for efetuada usando um ponto RTK da estação da base com coordenadas WGS-84, as coordenadas de grid para o ponto serão desativadas. No entanto, pode-se usar a posição do grid para uma calibração do local GPS. Se optar por isso, deve-se ativar a coordenada do grid (certifique-se de que possua uma qualidade superior daquela da coordenada WGS-84), explodir pontos por tipo de dados e voltar a calibrar. Os problemas com este método consistem em, se os vetores GPS forem emitidos da posição do grid:

  qualquer ponto GPS derivado da base não pode ser usado na calibração

  um erro, equivalente ao erro residual da calibração, pode ser introduzido

NOTA: Se tiver executado uma calibração do local GPS e marcado a caixa de seleção Usar coordenadas do solo no diálogo Configuração do local, a calibração definida no projeto torna-se inválida. Uma mensagem de erro lhe avisa que, se continuar com a operação, a calibração será removida.

Usando Modelos do Geóide

Se o sistema de coordenadas para o projeto definir o uso de um modelo Geóide para a determinação da elevação do ponto, então as elevações serão determinadas diretamente das alturas de WGS-84 por interpolação com o grid do modelo geóide. No entanto, ainda é possível aplicar um ajuste de altura no alto das elevações produzidas por um modelo geóide para permitir pequenas variações locais que um modelo geóide de grande escala não consegue levar em consideração. Elevações determinadas de uma calibração vertical recebem a qualidade de levantamento.

Normas para garantir uma calibração útil

  Coordenadas WGS-84 devem ser razoavelmente corretas.

É possível gerar pontos GPS autônomos. No entanto, não deve-se usar mais de um ponto autônomo WGS-84 em uma calibração, por exemplo, certifique-se de que somente uma só estação de base tenha sido configurada usando a tecla [image] com o software Trimble Survey Controller. Outras estações da base devem ser configuradas em posições medidas por um vetor GPS em relação à estação de base autônoma. Isso define o relacionamento entre elas e lhe permite efetuar uma calibração com pontos usados de qualquer uma estação da base corretamente. Isso é descrito abaixo:

A seguinte figura não mostra nenhum relacionamento entre as estações da base:

Pontos da Base 1 e Base 2 não devem ser usados para calibração.

Na figura seguinte, um relacionamento é definido entre as estações da base através da ocupação da segunda estação da base usando a primeira estação da base:

Pontos da Base 1 e Base 2 podem ser usados para uma calibração.

  As melhores possíveis coordenadas WGS-84 devem ser usadas para a estação base inicial num levantamento.

A precisão de vetores GPS (tempo real ou pós-processados) é afetada pela precisão da coordenada da base. Um erro de até uma parte por milhão (1 ppm) pode ser introduzido para cada dez metros de erro nas coordenadas da base. Por exemplo, se o ponto primário de referência WGS-84 possuir um erro de cem metros e a linha da base é de dois quilômetros de comprimento, pode haver um erro extra desnecessário de dois centímetros nos vetores GPS.


Mudando as configurações da calibração usando o registro

 Perspectiva geral e Mais informações

Quando o Trimble Geomatics Office é instalado, uma configuração de registro é adicionada ao controle do computador:

  o número de iterações efetuadas na computação de quadrados mínimos dos parâmetros da calibração

  o erro máximo permitido entre as posições calibrada e de grids conhecidos para os pontos da calibração

Usando as entradas, pode-se controlar quando um aviso é apresentado. O aviso indica que a computação não alcançou os critérios de erro máximo especificado.

Entradas do registro

As entradas (Erro Máximo e Contagem Mínima de Iteração) estão sob a tecla de registro:

HKEY_CURRENT_USER\Software\Trimble\Trimble Geomatics Office\1.5\Calibração

Erro Máximo

Para mudar o Erro Máximo, use esta entrada. O valor é o erro polar máximo horizontal (residual) permitido entre qualquer posição de ponto de calibração e a sua posição associada conhecida do grid.

Se este erro especificado for excedido, aparece uma mensagem de erro indicando que a computação da calibração excedeu o residual horizontal máximo definido.

Os resultados da calibração podem exceder o erro máximo especificado em qualquer das seguintes situações:

  um erro ocorreu na entrada de qualquer ponto de controle do grid

  qualquer ponto de controle foi mal identificado ou fixado incorretamente durante o levantamento

  a computação da calibração não convergiu dentro do número especificado de iterações

Quanto menor for o valor no Campo Erro Máximo, maior será a possibilidade de receber uma mensagem de que o erro máximo foi excedido. Isso porque foram definidos critérios mais rígidos para a combinação das posições computadas para posições conhecidas.

O valor padrão para este campo (sempre definido em metros), é de 0,1 m.

Contagem da Iteração Máxima

Para mudar o número máximo de iterações, use esta entrada para controlar o número máximo de iterações a serem executadas na computação dos quadrados mínimos dos parâmetros da calibração. A configuração deste valor para um número mais elevado faz com que as computações efetuem mais iterações, a não ser que a computação detecte que os parâmetros computados não estejam mais mudando com cada iteração.

O limite válido para este valor é de 5 a 5000. Se um valor for especificado para menos de 5, o valor mínimo de 5 será usado. Se um valor for especificado para mais de 5000, o valor máximo de 5000 iterações será usado. O número padrão de iterações é de 10.


Comando Calibração do Local GPS

Use este comando para executar uma Calibração do Local GPS.

Para acessá-lo, selecione Levantamento / Calibração do Local GPS.

Aparece o diálogo Calibração do Local GPS.

NOTA: Antes que apareça o diálogo Calibração do Local GPS, se contar com parâmetros de transformação do ajuste da rede definidos, eles serão descartados com a calibração do local GPS. Se possuir pontos com o mesmo nome que foram juntados, uma mensagem confirmará se quer explorar os pontos por tipo de dados.


Diálogo Calibração do Local GPS

 Perspectiva geral e Mais informações

Use este diálogo para executar uma calibração do local GPS.

Para acessá-lo, selecione Levantamento / Calibração do Local GPS.

Para executar uma Calibração do Local GPS:

1.	Especifique quais componentes da calibração devem ser computados.

2.	Defina a lista dos pares de coordenadas. Um par é uma posição derivada de grid e uma posição derivada de GPS para o mesmo ponto físico.

3.	Aplique a calibração atual ao banco de dados.

Componentes da calibração

O grupo componentes da calibração contém as seguintes caixa de seleção e campos:

Transformação do Datum

Tipicamente, haverá uma transformação do datum predefinida disponível como parte da definição do sistema de coordenadas. Esta transformação do datum pode ser uma transformação do parâmetro três ou sete, uma definição de regressão múltipla ou pode ser baseada sobre arquivos do grid do datum (por exemplo, NADCON). Nestes casos, é improvável que queira computar uma outra transformação do datum, deixe pois desmarcada a caixa de seleção da Transformação do datum. No entanto, se não houver informações sobre a transformação do datum disponíveis ou se tiver motivos para duvidar dos parâmetros disponíveis, compute a transformação do datum.

Para computar uma transformação do datum entre o elipsóide WGS-84 e o elipsóide local usado como parte da definição do sistema de coordenadas para o projeto, marque esta caixa de verificação. São disponíveis as opções Transformação de três parâmetros e Transformação de sete parâmetros. Selecione o tipo de transformação de datum para computar.

NOTA: Esta opção não é disponível em projetos que possuem um sistema de coordenada de projeção padrão (Transversal Mercator), pois a projeção padrão é baseada diretamente no elipsóide WGS-84, significando que nenhuma transformação do datum é necessária.

Se uma transformação do datum é computada e a calibração aplicada ao banco de dados, o campo Datum da guia Sistema de coordenadas do diálogo Propriedades do projeto exibe ‘Calibração’.

Atualizar origem da projeção padrão

Esta opção somente está ativa se a definição do sistema de coordenadas usar um projeção padrão. Para atualizar a origem da projeção usando o primeiro ponto de controle bidimensional da Lista do Ponto, use esta opção. Como a projeção padrão não possui uma origem de latitude e longitude de um norte falso e leste falso definida, a atualização da origem garante que a origem do projeto seja local (isto é, próxima aos dados de levantamento do seu projeto).

Se estiver executando uma calibração GPS num projeto que já possui definida a projeção padrão, certifique-se de que esta caixa de seleção não está marcada, para que a definição da projeção padrão não seja alterada.

Ajuste horizontal

Para computar um Ajuste horizontal, selecione esta opção. A caixa de seleção Ajustar o fator escala para um torna-se disponível. Se não quiser que as suas distâncias sejam escaladas, use esta opção para ajustar o fator escala para 1. A ajuste Horizontal é uma transformação plana consistindo de translações nas direções norte/sul e leste/oeste, uma rotação em torno de uma origem definida e um fator escala. Os parâmetros de transformação são computados através do uso de métodos de quadrados mínimos para encontrar a transformação que fornece parâmetros que, quando aplicados a posições GPS, melhor condigam com as coordenadas do grid de controle.

O ajuste horizontal reduz todo erro residual entre as coordenadas de controle e as coordenadas de grid calculadas de posições GPS.

SUGESTÃO: Geralmente é bom computar um Ajuste horizontal sem ajustar o fator escala para um inicialmente para verificar se o fator de escala computado está próximo de um. Se o fator de escala computado não estiver próximo de um, isso pode indicar um problema nos pares de ponto de calibração selecionados.

Ajuste vertical

Para computar um Ajuste vertical, selecione esta opção. É um ajuste do plano inclinado consistindo de uma mudança vertical numa origem definida e inclinações nas direções norte e leste. Os parâmetros para este ajuste são computados através do uso de métodos de quadrados mínimos para encontrar um plano de ajuste que melhor condiga com as elevações derivadas das alturas GPS com as elevações do ponto de controle. Isso requer pares de pontos de calibração tridimensionais. Com um só par de pontos de calibração tridimensional, somente o parâmetro de mudança vertical pode ser computado. Se forem dois os pares de pontos de calibração tridimensionais disponíveis, o sistema define um plano de correção que condiz exatamente com estes pares.

Se o projeto usar um modelo geóide, o ajuste vertical é computado e aplicado sobre as correções do modelo geóide.

Modelo do Geóide

O campo Modelo do Geóide exibe o nome do modelo do geóide que é selecionado como parte da definição do sistema de coordenadas. Se não houver modelo do geóide,  aparece ‘Nenhum’. Este é um campo somente para visualização. A configuração do modelo do geóide somente pode ser mudada através da guia Sistema de coordenadas no diálogo Propriedades do projeto.

Lista de Ponto

Clique na Lista de Ponto para selecionar os pares de pontos da calibração que serão usados nas computações de calibração. O diálogo Calibração do local GPS fica oculto e aparece o diálogo Lista de Ponto.

Sumário da computação

Os campos deste grupo apresentam um resumo da última computação da calibração. Use este resumo para confirmar se a calibração é válida sem ter que olhar no relatório da computação.

Fator de escala de ajuste horizontal

O campo Fator de escala de ajuste horizontal apresenta o fator de escala computado para o Ajuste horizontal. Se marcou a caixa de seleção Ajustar o fator escala para 1, ela exibe um. Use este campo para confirmar se o fator escala computado está próximo a um. Se não está, isso indicará que existe um problema com um ou mais pares de pontos de calibração.

Máxima inclinação do ajuste vertical

O campo Máxima inclinação do ajuste vertical apresenta a inclinação máxima do ajuste de altura computado baseado nos valores computados Declive norte e Declive leste.

Máximo resíduo horizontal e Máximo resíduo vertical

Os campos Máximo resíduo horizontal e Máximo resíduo vertical exibem os resíduos máximos da última computação efetuada.

OK

Clique OK para aplicar a última calibração computada ao banco de dados.

Uma recomputação é executada para certificar que todos pontos GPS são atualizados de acordo com a calibração GPS. Os detalhes do sistema de coordenadas são atualizados com os parâmetros da calibração.

Para visualizar os detalhes da calibração:

1.	Selecione Arquivo / Propriedades do Projeto.

2.	Selecione a guia Sistema de Coordenadas.

3.	Clique Detalhes.

4.	Selecione a guia Ajuste Horizontal ou a guia Ajuste Vertical.

Cancelar

Clique Cancelar para sair da Calibração do local GPS sem aplicar a calibração computada.

Computar

Clique em Computar para computar os parâmetros de calibração GPS depois de ter mudado todas configurações do componente da calibração. Uma vez que a computação tenha sido executada, os resultados são resumidos nos campos do Sumário da computação.

Salvar como local

Clique em Salvar como local para salvar a calibração atual e detalhes do sistema de coordenadas no banco de dados do sistema de coordenadas como uma definição do local. Aparece o diálogo Salvar como local. Insira o nome para a definição do local salvada e clique OK. Pode-se usar esta definição do local como a definição do sistema de coordenadas para projetos futuros.

Sistema de Coord

Clique em Sistema de Coord para visualizar os detalhes atuais do sistema de coordenadas do projeto. O mesmo diálogo aparece como diálogo Detalhes em Arquivo / Propriedades do Projeto / guia Sistema de Coordenada.

Relatório

Clique em Relatório para visualizar um relatório detalhado da computação da calibração. Este relatório mostra todos parâmetros computados e uma listagem de coordenadas do ponto de controle computadas comparadas com as suas posições conhecidas e valores residuais individuais.


Calibração do Local GPS - diálogo Lista de Ponto

Use este diálogo para selecionar os pares de pontos de calibração que quer usar para calcular os parâmetros de calibração do local GPS.

Para acessá-lo:

1.	Selecione Levantamento / Calibração do Local GPS. Aparece o diálogo Calibração do Local GPS.

2.	Clique Lista de Ponto.

Aparece o diálogo Calibração do Local GPS – Lista de Ponto.

Este diálogo apresenta uma lista de rolagem dos agrupamentos de pares de pontos de calibração. Não existe um limite específico para o número de pares que podem ser definidos para computar uma calibração. A adição de um grande número de pares nem sempre melhora os resultados da calibração, mas fornece verificações extras na validade dos parâmetros computados.

Cada par de pontos de calibração consiste de um Ponto GPS (um ponto com uma posição GPS ou um ponto derivado de um vetor GPS) e um ponto do grid (que normalmente é um ponto de controle, um ponto ajustado ou derivado de observações terrestres) que não pode ser um ponto derivado de GPS.

NOTA: Um ponto GPS deve provir de um vetor GPS que saia de uma coordenada WGS-84. Um vetor GPS que sai de uma coordenada do grid não pode ser usado para definir um ponto GPS..

Na medida que se seleciona ou especifica pontos para serem incluídos na lista de ponto, o sistema verifica se cada ponto GPS possui mesmo uma derivação GPS e se cada ponto de grid não tem uma derivação de GPS.

As posições dos pares de pontos da calibração são realçados na tela de gráficos com um símbolo de caixa no ponto GPS e um símbolo de cruz no ponto de controle com uma linha que une as duas posições. Deve-se fazer um zoom aumentando um dos pares de pontos de calibração para ver este detalhe. Os símbolos e linha de ligação para o par de pontos de calibração atual na lista de ponto são apresentados com linhas pontilhadas.

Tipicamente, selecionam-se pontos para os pares de pontos de calibração usando o preenchimento de campo para tomar os pontos apropriados da janela de gráficos. Preenchimento de campo somente permite selecionar pontos derivados de GPS como um ponto GPS e pontos sem uma derivação GPS como um ponto de grid. Também pode-se inserir os nomes dos pontos que queira usar nos campos Ponto GPS e Ponto do Grid.

Se um ponto GPS possui e usa uma elevação de grid (e que não é derivada da altura GPS e modelo do geóide), pode-se usar o mesmo ponto no ponto GPS e ponto do grid. Se fizer isso, o campo Tipo é configurado para Vertical.

NOTA: Se tiver dois pontos separados (um ponto GPS e um ponto grid) com o mesmo nome, quando o ponto GPS é selecionado, o ponto do grid com o mesmo nome é selecionado automaticamente. Se as coordenadas de GPS e grid são salvadas sob o mesmo ponto, será necessário Explorar por tipo.

Se não possuir pontos apropriados de controle do grid ou pontos GPS no banco de dados, pode-se especificar os valores apropriados de coordenadas para tais pontos nos campos fornecidos. Neste caso, não deve-se especificar o nome do ponto para o ponto, pois o Timble Geomatics Office espera umm ponto com este nome no banco de dados. Posições inseridas deste modo não são armazenadas no banco de dados.

Para especificar valores de coordenadas (ponto GPS ou Grid) para a calibração:

1.	Clique o ícone de mais (+) ao lado do Ponto GPS ou Ponto Grid nos campos do Nome.

A visualização da árvore de expande para mostrar os campos da coordenada.

2.	Use o preenchimento de campo ou insira um valor usando o teclado para preencher os campos das coordenadas.

Se não puder selecionar um ponto GPS para usar numa calibração do local GPS, consulte o tópico Problemas com a seleção de pontos para uma calibração do local GPS.

Tipo

Para especificar como o par de pontos de calibração deve ser usado na computação da calibração, use este campo. O Trimble Geomatics Office preenche automaticamente este campo com o tipo apropriado quando se seleciona um par de coordenadas. Pode-se mudar o tipo, desde que a opção selecionada seja válida. Por exemplo, se o ponto de controle não possuir uma elevação, não pode-se configurar o campo Tipo para o par para Horz e Vert.

As opções disponíveis são:

  Horz e Vert − Esta opção especifica que o par do ponto de calibração é apropriado para uso na determinação dos ajustes horizontal e vertical.

  Horizontal − Esta opção especifica que o par de pontos da calibração somente é apropriado para uso na determinação de um ajuste horizontal. Efetivamente o valor de elevação para o ponto do grid não é confiável.

  Vertical − Esta opção especifica que o par de pontos de calibração somente é apropriado para uso na determinação de um ajuste vertical. Efetivamente, os valores Norte e Leste para o ponto do grid não são confiáveis.

  (Ignorado) − Esta opção especifica que o par de pontos da calibração não deve ser usado na computação de qualquer parâmetro de transformação. Esta é um opção útil se teve um problema na computação da calibração e estiver tentando localizar um par de pontos de calibração suspeito. Pode-se usar esta configuração para remover um par de pontos de calibração temporariamente da computação para ver se os resultados melhoraram.

  (Inválido) − Esta opção mostra que o par de pontos selecionado não é um par de pontos válido.

Estatíticas

Os campos deste grupo apresentam os resultados da calibração baseados nos valores que foram adicionados na Lista de Ponto. Use o sumário para verificar as estatísticas da calibração e identificar pares de pontos maus antes de aceitar a Lista de Ponto.

Fator de escala de ajuste horizontal

O campo Fator de escala de ajuste horizontal exibe o fator de escala computado para o ajuste horizontal. Se marcou a caixa de seleção Ajustar o fator escala para 1, será “um”. Use este campo para confirmar se o fator de escala computado está próximo de um. Se não estiver próximo de um, este diz que existe um problema com um ou mais pares de pontos de calibração.

Máxima inclinação do ajuste vertical

O campo Máxima inclinação do ajuste vertical apresenta a inclinação máxima para o ajuste da altura computada, baseado nos valores computados do declive norte e declive leste.

Máximo resíduo horizontal e Máximo resíduo vertical

Os campos de Máximo resíduo horizontal e Máximo resíduo vertical mostram os resíduos máximos.

Inserir

Clique Inserir para inserir um registro vazio do par de pontos de calibração. Isso é útil se estiver usando a projeção padrão e quiser atualizar a origem da projeção. O primeiro par de pontos é usado para atualizar a origem, portanto use este botão para inserir um novo par de pontos de calibração em branco no alto da lista.

Apagar

Clique Apagar para remover um par de pontos de calibração da lista.


Problemas na seleção de pontos para uma calibração do local GPS

Se estiver usando o diálogo Calibração do Local GPS – Lista de Ponto para selecionar pontos para uma calibração do local GPS, e o sistema não lhe deixar selecionar um ponto para o ponto GPS ou ponto de Grid do par de pontos de calibração:

Um ponto GPS não pode ser selecionado porque o ponto de é derivado de um grid.

O ponto é o resultado de um vetor onde ‘do ponto’ do vetor derivou de uma posição de grid. Isso pode acontecer se foi digitada um posição de grid para uma estação base depois de um levantamento Cinemático em Tempo Real (RTK). Todos vetores que saem da estação de base são aplicados. No entanto, a posição para qualquer um destes pontos é derivada através do uso de uma combinação de valores WGS-84 (o vetor) e valores do grid (a posição WGS-84 da base). Não pode-se usar qualquer ponto que possua vetores aplicados a partir da base. Isso é ilustrada na figuras que seguem:

  Ponto 1 não pode ser usado como um ponto GPS numa calibração do site GPS.

A posição do grid da base é convertido para WGS-84 e o vetor é aplicado para posicionar o ponto 1.

  Ponto 1 pode ser usado como um ponto GPS numa calibração do local GPS.

O vetor é aplicado à posição WGS-84 da base para determinar a posição do ponto 1.

Para resolver isso, use a janela Propriedades para editar as coordenadas para o ponto e para inserir uma posição WGS-84. Isso será usado como em preferência à posição do grid e todos vetores que saem da estação de base serão disponíveis como pontos GPS numa calibração do local GPS.

Do mesmo modo que o ponto GPS não pode ser selecionado porque o ponto de é derivado de uma posição de grid, um ponto grid não pode ser usado se o ponto de for derivado de uma posição GPS.  Um ponto Grid deve provir de uma observação terrestre.


Transformação de Três Parâmetros

Use uma Calibração do Local GPS para definir uma transformação do datum se não tiver um sistema de coordenadas definido e quiser criar seus próprios parâmetros de transformação doi datum para a área do projeto.

O algoritmo de transformação de três parâmetros computa valores de translação ao longo dos eixos cartesianos X, Y e Z do centro do elipsóide WGS-84 para o centro do elipsóide para a projeção local. As posições do ponto de controle são usadas para determinar o posicionamento espacial do elipsóide local e, daí, o seu relacionamento com o elipsóide WGS-84.


Transformação de Sete Parâmetros

Use uma Calibração do Local GPS para definir uma transformação do datum se não tiver um sistema de coordenadas definido e quiser criar seus próprios parâmetros de transformação do datum para a sua área do projeto.

O algoritmo de transformação dos sete parâmetros computa três valores de translação, três valores de rotação e uma mudança de escala entre o elipsóide WGS-84 e o elipsóide para a projeção local. Os três valores de translação são computados ao longo dos eixos cartesianos X, Y e Z do centro do elipsóide WGS-84 para o centro do elipsóide local como na transformação de três parâmetros. Ele computa rotações aproximadamente a cada eixo entre os dois elipsóides e um fator de escala que permite todas diferenças de tamanho entre os dois elipsóides (devido aos diferentes eixos semi-maiores elipsoidais e valores de achatameto).

As posições do ponto de controle são usadas para determinar o posicionamento espacial do elipsóide local e daí a sua relação ao elipsóide WGS-84. Existem estreitas correlações entre a translação computada e os valores da rotação (isto é, o resultado de um ângulo de rotação muito pequeno aplicado num raio muito grande tal como o raio da terra que é muito parecido a  uma translação). Isso significa que é fácil terminar com grandes valores computados de compensação que não são precisos se os pontos de controle não cobrirem uma área grande o suficiente. Tipicamente, uma transformação de sete parâmetros não deve ser computada, a não ser que os pontos de controle cobram uma extensão de aproximadamente oitenta quilômetros por oitenta quilômetros. Além disso, todos valores de rotação computados não devem exceder 10" do arco.


Observações GPS - Perspectiva geral

Ver também

Uma observação GPS, ou linha de base, é um vetor entre dois pontos observados usando GPS. Os dois pontos usados para determinar uma linha de base dependem da técnica de levantamento usada. Por exemplo, num levantamento Cinemático em Tempo Real (RTK) ou num levantamento Cinemático Pós Processado (PPS), existe uma linha de base da estação da base para cada ponto de rover.

No entanto, com levantamentos estáticos e fast static, não existe uma estação base. Com estas técnicas de levantamento, existe um vetor GPS entre pontos que está ocupado já por algum tempo, como mostra a seguinte tabela:

Para visualizar o tipo de linha de base, selecione-o e abra a janela Propriedades.

Vetores Estático, Fast Static e Cinemático Pós Processado (PPK)

Observações Estática, Fast static e PPK que não foram pós processadas, são linhas de base não processadas. Quando as linhas de base são pós processadas, elas tornam-se linhas de base pós processadas.

Quando se apaga uma linha de base pós processada, a linha de base volta a ser uma potencial linha de base. Pode-se remover a linha de base apagando os pontos. Alternativamente, desative a linha de base se não quiser que seja usada em posteriores computações de levantamentos e ainda quiser manter os pontos.

Vetores PPK Contínuos

Quando vetores PPK contínuos são pós processados, eles são exibidos na mesma cor das linhas de base PPK, mas exibem o método de Campo como sendo ‘Contínuo’ na janela Propriedades.

Vetores RTK

Vetores RTK não podem ser potenciais linhas de base, eles são exibidos como ‘Linhas de base RTK’ na janela Propriedades. Vetores RTK contínuos são exibidos na mesma cor das linhas de base RTK, mas exibem o método de Campo como ‘Contínuo’ na janela Propriedades.

Vetores Verificar

Se o status de uma linha de base for configurado para ‘Verificar’, a linha de base aparece com linhas pontilhadas.

Vetores Desativados

Se o status de uma linha de base é configurado para ‘Destivado’, a linha de base vai aparecer com a cor apropriada para linhas de base desativadas.


Ocupações GPS

Um registro de ocupação GPS é criado cada vez que um ponto é observado usando um GPS.

Para visualizar registros da Ocupação GPS os registros que usam a janelas Propriedade:

1.	Selecione uma das seguintes opções:

  um ponto observado usando GPS

  a linha de base (na visualização do levantamento)

2.	Clique o ícone [image] para visualizar o registro Ocupação GPS.

Se selecionar um ponto observado usando GPS na janela Propriedades, pode-se visualizar todos registros de Ocupação GPS para aquele ponto. Se selecionar uma linha de base usando a janela Propriedades, pode-se visualizar a Ocupação GPS que produziu a linha de base.

O registro de ocupação GPS inclui:

  O nome do ponto.

  O período de tempo para a ocupação e o tempo de início da ocupação.

  Detalhes da antena GPS, incluindo altura, tipo e método da antena.

Durante a importação de dados as horas de Início e de Fim são convertidos do horário GPS para o horário UTC (Horário Universal Coordenado – ou Horário de Greenwich). As horas são exibidas então como hora local utilizando o Fuso Horário configurado no Microsoft Windows.


Constante do Prisma

A constante do prisma é uma correção da distância do declive medida com uma estação total. Ela é aplicada durante a recomputação. É necessária porque a superfície refletora do prisma não está diretamente acima do ponto de levantamento que está sendo medido. A constante é normalmente um valor negativo.

Onde:

	é a distância corrigida do declive
	é a distância medida do declive
	é a constante do prisma

O valor constante do prisma é armazenado com as informações da configuração do alvo.

Para visualizar e editar um valor constante do prisma:

1.	Selecione um ponto de definição do alvo ou uma observação convencional.

2.	Abra a janela Propriedades.

Clique o botão [image].

NOTA: Nos softwares 3300/3600/5600 Elta e 3600/5600 GDM, a constante do prisma é aplicada no instrumento, mas não é armazenada no arquivo. A constante do prisma aparece como um ‘?’.

Se uma constante de prisma incorreta foi configurada no instrumento e o valor deve ser corrigido no Trimble Geomatics, no campo da constante do prisma da janela propriedades, insira a diferença entre a constante de prisma incorreta e aquela correta. Por exemplo, se inseriu uma constante de prisma de “20”, quando deveria ter inserido “5”, insira “–15”.

SUGESTÃO: O diálogo Edição múltipla pode ser usado para editar múltiplas observações.


Correções para Excentricidade de Montagem do Equipamento de Medição da Distância Eletrônica (EDM)

A maioria das modernas estações totais não requerem uma correção para a excentricidade da montagem, pois o caminho da Medição de Distância Eletrônica (EDM) coincide com a linha de visada do telescópio. Esta correção não é requerida se uma EDM montada em telescópio for usada com um refletor de inclinação onde o refletor/alvo foi projetado para condizer com a configuração do EDM/Telescópio.

No entanto, em alguns casos pode ser necessário computar uma correção para a distância medida do declive para encontrar a distância verdadeira do declive que seria observada se o caminho da mediçao EDM fosse coincidente com a linha de visada do telescópio. A correção da excentricidade da montagem depende do tipo do sistema de montagem e é aplicada automaticamente pelo Trimble Geomatics Office usando a fórmula apropriada especificada abaixo.

O valores apropriados do offset são armazenados no registro do instrumento no arquivo do dispositivo.

1. EDM montadas padrão com refletor sem inclinação.

Onde:

	é a distância corrigida do declive
	é o offset da EDM (no instrumento)
	é o offset do refletor (no alvo)
	é o ângulo vertical do zênite (observado)
	é a distância medida do declive (depois da aplicação da correção da constante do prisma)

2. EDM montada num telescópio com refletor sem inclinação.

Onde:

	é a distância corrigida do declive
	é o offset da EDM (no instrumento)
	é o offset do refletor (no alvo)
	é o ângulo vertical do zênite (observado)
	é a distância medida do declive
Esta correção é aplicada durante e importação de um arquivo do dispositivo.


Correção da Pressão e Temperatura

As correções de pressão e temperatura são para distâncias medidas eletronicamente para corrigir as variações do comprimento medido devido à temperatura ou pressão. Pode-se inserir os valores apropriados durante o trabalho de campo ou editar o arquivo do dispositivo antes de importá-lo.

As medições eletrônicas de distância feita pela EDM são baseadas na velocidade da luz através do ar. A temperatura e pressão afetam esta velocidade.

Esta correção atmosférica somente é feita para medições de distância de a EDM não tiver já aplicado uma correção apropriada.

Onde:

	é a distância corrigida do declive
	é a distância medida do declive
	é um índice refrativo de grupo pré-configurado para as freqüências de modulação e portadora do instrumento da EDM
	é a constante para o comprimento de ondas da portadora do instrumento da EDM (mm Hg)
	é a pressão atmosférica em mm de mercúrio
	é a temperatura do ar seco em graus Celsius

NOTA: A Trimble recomenda que se registre a pressão e temperatura no software Trimble Survey Controller. Esta correção é aplicada às distâncias de declive quando se importa um arquivo .dc.

NOTA – Nos softwares 3600/5600 Zeiss Elta, 3600/5600 GDM e TDS Survey Pro, as correções de pressão e temperatura são aplicadas no instrumento. Portanto, as observações já estão corrigidas antes de serem importadas para o Trimble Geomatics Office.


Colimação Vertical

A correção da colimação vertical é uma correção angular aplicada diretamente ao ângulo vertical.

A colimação vertical de um instrumento é estabelecida através de uma observação cuidadosa de um objeto usando ambas faces do instrumento. O valor estabelecido da correção indica um erro constante devido ao posicionamento ligeiramente incorreto dos fios cruzados no telescópio.

Quando o erro de colimação de um instrumento é estabelecido, haverá um registro de colimação armazenado no coletor de dados e a colimação vertical é aplicada em todos os seguintes ângulos verticais:

Face 1:
Face 2:
Onde:

	é o ângulo vertical corrigido
	é o ângulo vertical observado (ângulo zênite)
	é a correção da colimação vertical. Esta correção é aplicada durante a importação de um arquivo coletor de dados.

NOTA: O Trimble Survey Controller não possui um programa de colimação. Correções de colimação não são efetuadas durante a importação.

NOTA: Nos softwares 3300/3600/5600 Elta, 3600/5600 GDM e TDS Survey Pro, a colimação vertical é aplicada antes de ser importada para o Trimble Geomatics Office.


Curvatura e Refração

A correção da curvatura e refração é feita para o ângulo vertical observado para levar em conta o efeito da curvatura da terra e a refração atmosférica vertical dos caminhos da luz.

Onde:

	é o ângulo vertical corrigido do zênite
	é o ângulo vertical observado do zênite
	é a distância corrigida do declive
	é o coeficiente da refração – tipicamente 0,142 ou 0,20 dependendo do valor do registro do trabalho no arquivo coletor de dados
	é o raio da terra
NOTAS:

•	Este formato retorna um valor em radianos.

•	A correção da curvatura e refração é aplicada durante a importação de um arquivo do Trimble Survey Controller.

•	No software 3300/3600/5600 Elta, a curvatura e refração são aplicadas no instrumento. Portanto, as observações já são corrigidas antes de serem importadas para o Trimble Geomatics Office.

•	No software 3600/5600GDM, a curvatura e refração são aplicadas para coordenadas calculadas. Observações não processadas são importadas e corrigidas no Trimble Geomatics Office.

•	No software TDS Survey Pro, a curvatura e refração são aplicadas no importação para o Trimble Geomatics Office.


Colimação Horizontal

NOTA: O Trimble Survey Controller não possui um programa de colimação. Nenhuma correção de colimação é efetuada durante a importação.

Se um registro de colimação for encontrado, o Trimble Geomatics Office aplica a colimação horizontal de acordo com a seguinte forma:

Face 1:
Face 2:
Onde:

	é o ângulo horizontal corrigido
	é o ângulo horizontal observado
	é a correção da colimação horizontal

Esta correção de colimação, quando necessário, é aplicada durante a importação do arquivo coletor de dados.

NOTA: Nos softwares 3300/3600/5600 Elta, 3600/5600 GDM e TDS Survey Pro, a colimação horizontal é aplicada antes de ser importada ao Trimble Geomatics Office.


Orientação Horizontal

Ver também

Ângulos horizontais terrestres são orientados durante a recomputação através do uso do azimute para a visada atrás. O ângulo horizontal é adicionado ao Azimute e o resultado e o ponto azimute para visada atrás. Isso orienta todas observações para a configuração.

O ponto Azimute para visada atrás é determinado através do uso das seguintes normas (somente para observações convencionais):

  Se somente a posição do ponto do instrumento e os pontos da visada atrás forem conhecidos (isto é, não há azimute digitado) a recomputação usa o azimute de visada atrás determinado do inverso entre dois pontos.

  Se somente um azimute digitado estiver disponível e para ponto não possuir uma coordenada, a recomputação usa este como o azimute de visada atrás.

  Se ambas posições do ponto do instrumento e do ponto de visada atrás forem conhecidos e um azimute digitado for disponível, a recomputação determina  a qualidade de cada azimute e usa a hierarquia na tabela abaixo para determinar qual azimute deve usar como azimute de visada atrás.

Por exemplo, se houver um instrumento de qualidade de levantamento e um par de pontos de visada atrás, juntamente com um azimute digitado de qualidade controle, o azimute digitado será usado para ser o azimute de visada atrás.

NOTA: Para computar a qualidade do azimute de visada atrás, a qualidade horizontal para o ponto do instrumento e o ponto de visada atrás são examinados e a menor qualidade é tomada. Por exemplo, se o ponto do instrumento possui uma qualidade de controle e o ponto de visada atrás possui uma qualidade de mapa, o azimute de visada atrás terá uma qualidade de mapeamento.

Tipo	Qualidade
Derivado de coordenadas	Controle
Azimute digitado	Controle
Derivado de coordenadas	Levantamento
Azimute digitado	Levantamento
Derivado de coordenadas	Mapeamento
Azimute digitado	Mapeamento

NOTA: Se desejar que uma recomputação use o azimute digitado em preferência ao azimute determinado entre o instrumento e o ponto de visada atrás, aumente a qualidade da posição do azimute digitado para que seja mais elevado na hierarquia que o azimute determinado entre o instrumento e o ponto de visada atrás.

SUGESTÃO: A qualidade de um azimute digitado pode ser editada.


Ângulos Horizontais

 Ver mais

Para observações terrestres, o software Trimble Geomatics Office armazena ângulos horizontais não orientados entre dois pontos. Os ângulos são orientados durante a recomputação.

Durante a importação, o ângulo horizontal é determinado por:

Onde:

	é o ângulo horizontal armazenado no software Trimble Geomatics Office
	é a observação horizontal para o ponto adiante
	é a observação horizontal ao ponto de visada atrás
O valor BSObs é armazenado no registro BKB do arquivo coletor de dados (o registro BKB é um tipo de registro num arquivo .dc que possui o registro de visada atrás).

Se não houver registro de mira retrovisora, o Trimble Geomatics Office trata o primeiro ponto observado como ponto de mira retrovisora.


Redução do declive

Perspectiva geral

Para cada observação terrestre, o Trimble Geomatics Office reduz a distância do declive para os seus componentes horizontal e vertical durante a Recomputação.

As seguintes duas fórmulas são usadas:

Onde:

	é a distância horizontal na elevação da fonte
	é a diferença em altura entre os pontos fonte e alvo
	é a distância do declive (depois das correções observacionais)
	é o ângulo vertical (zênite)
Consulte o diagrama da redução. O diagrama esclarece os valores usados nas duas fórmulas acima.


Correção do Nível do Elipsóide

A correção do nível do mar (ou correção do nível do elipsóide) é aplicada à distância horizontal computada. Para ver se as correções do nível do mar são aplicadas, selecione Arquivo / Propriedades do projeto / guia Geral.

Esta correção reduz uma distância horizontal à distância que teria sido medida no nível do elipsóide (não nível do geóide, que seria o nível do mar). Esta diferença não é significativa para a redução.

Se a caixa de seleção correções do nível do elipsóide estiver marcada, as observações terrestres são aplicadas ao longo do elipsóide local. Se a caixa de seleção correção do nível do elipsóide estiver desmarcada, as observações terrestres são aplicadas ao longo do solo.

A fórmula da correção do nível é:

Onde:

	é o raio da terra
Consulte o diagrama da redução. O diagrama esclarece os valores usados na fórmula acima.

NOTA: A correção do nível do elipsóide não é aplicada num trabalho de somente fator escala. Ao importar um arquivo somente fator escala, a correção do nível do elipsóide do Trimble Geomatics Office é desativada automaticamente, a não ser seja marcada a caixa de verificação Usar coordenadas do solo do diálogo Configurações do local.


Raio da Terra

No software Trimble Geomatics Office, o raio da terra é calculado através da latitude do projeto e do elipsóide do projeto. Se uma latitude do projeto não for definida para o projeto, usa-se uma latitude padrão do projeto de 30 graus. Por exemplo, no elipsóide WGS-84, com uma latitude do projeto de 30 graus, o valor para o raio da terra é de 6383 480.917.

NOTA: Defina o projeto da latitude antes de importar observações terrestres. Se definir a latitude do projeto depois da importação de dados terrestres, a correção e curvatura elipsoidal e a correção da refração não são reaplicados com o uso do recém calculado raio da terra.

Para inserir a latitude do projeto:

1.	Selecione Arquivo / Propriedades do projeto. Aparece o diálogo Propriedades do projeto.

2.	Selecione a guia Sistema de coordenadas.

3.	No grupo Configurações do local, clique Mudar.

4.	No grupo Local do projeto, insira a latitude do projeto.


Observações Convencionais - Perspectiva geral

O Trimble Geomatics Office suporta pontos observados usando instrumentos convencionais de levantamento. Este pontos são chamados observações convencionais.

No software Trimble Geomatics Office pode-se:

  Importar observações convencionais.

  Importar observações do telêmetro a laser

  Importar arquivos do nível digital


Redução de Observações Convencionais

A operação de Recomputar do Trimble Geomatics Office usa as medições da distância e ângulos observados para computar coordenadas para pontos observados convencionalmente.

Importar

Durante a importação do arquivo, as seguintes correções são aplicadas:

  Pressão e temperatura, aplicadas à distância do declive.

  Curvatura e refração, aplicadas ao ângulo vertical.

  Ângulo horizontal, reduz as observações para ângulos horizontais a partir do ponto de visada atrás. Leituras da face dois são armazenadas como leituras da face um.

  Correções para Excentricidade da Montagem do Equipamento de Medição da Distância (EDM).

  Colimação horizontal (somente para arquivos .sdr).

  Colimação vertical (somente para arquivos .sdr).

Recomputação

Durante a recomputação, as seguintes correções são aplicadas:

  Correção do elipsóide

  Orientação Horizontal

  Constante do Prisma


Diagrama da Redução

Nestas correções, o seguinte diagrama esclarece os valores usados nas fórmulas:

Onde:

	é o ângulo vertical (zênite)
	é a distância do declive (após as correções observacionais)
	é a elevação do ponto da fonte acima do elipsóide
	é a diferença em altura entre os pontos da fonte e do alvo
	é a distância horizontal na elevação do ponto da fonte
	é a corda do nível do mar (ou nível do elipsóide)
	é a distância do nível do mar (elipsóide)


Observações Convencionais - Observações de duas faces
Observações Convencionais - Observações da Face Dois

Observações Convencionais - Observações de Duas Faces

Observações de Duas faces são convertidas e armazenadas no banco de dados como observações de Uma face. Para selecionar uma observação, use a Janela Propriedades. Aparece a Face (uma ou duas).

Se existem observações da Face 1 e Face 2 de e para os mesmos pontos, tira-se a média das observações da Face 1 e Face 2 e são importadas como se fosse uma só informação. O tipo de observação é ilustrado como uma média..


Observações Convencionais - Transversal

Ao usar os softwares Trimble Survey Controller, TDS Survey Pro ou 3600/5600 Elta, pode-se calcular um fechamento forçado da transversal para as observações convencionais e ajustar a transversal.

Se tiver ajustado uma transversal e quiser mudar os valores ajustados, siga estes passos:

1.	Selecione o ponto cujas coordenadas queira mudar.

2.	Abra a Janela Propriedades e expanda o ponto usando a estrutura da árvore.

3.	Verifique se já existe um coordenada grid/local para o ponto. Se não existe, adicione uma coordenada usando o botão Adicionar Coordenada

4.	Clique nos campos coordenada e insira os valores da coordenada conhecida.

5.	Nos Controles do Seletor de Qualidade ao lado dos campos das coordenadas, selecione a opção Qualidade da lista de caída. A qualidade deve ser de levantamento ou mais elevada para ser usada em preferência à observação.

6.	Clique OK.

7.	Pressione F4 para efetuar uma recomputação dos dados de levantamento.

Uma recomputação determina todos fechamentos forçados entre as coordenadas conhecidas e as coordenadas observadas.

Os fechamentos forçados são mostrados no relatório Recomputar. Se não quiser ver estes fechamentos forçados, desative a observação.

Para visualizar os fechamentos forçados, escolha uma das seguintes opções:

  Selecionar Relatórios / Relatório Re-computar.

  Clique o botão [image] da página Aviso na janela Propriedades e clique o ícone derivação do ponto [image].

  Clique o botão [image] da página Resumo da janela Propriedades e clique o ícone da derivação do ponto [image].


Observações do Telêmetro a Laser - Perspectiva geral

O software Trimble Geomatics Office suporta pontos observados com telêmetros a laser com a versão 7.00 ou mais recente do software Trimble Survey Controller. Para informações sobre quais os telêmetros a laser o software Trimble Survey Controller suporta, consulte o Manual de Referência do Trimble Survey Controller.

A visualização das observações do telêmetro a laser depende da configuração da aparência na janela Propriedades.

No software Trimble Geomatics Office pode-se:

  Importar arquivos do Survey Controller (*.dc) que contêm observações do telêmetro a laser (pontos observados com telêmetros a laser são importados para o software Trimble Geomatics Office do mesmo modo como os pontos convencionais).

  Visualizar observações do telêmetro a laser na janela Propriedades.

  Selecionar e relatar observações do telêmetros a laser.


    Observações do Telêmetro a Laser - Visualização

Observações do telêmetro a laser são exibidas na Visualização do levantamento. A cor em que aparecem depende da configuração do fundo da Visualização / Opções / guia Inscrição do levantamento.

SUGESTÃO: Escolha Selecionar / Por pergunta e use a opção Pontos do telêmetro a laser para selecionar todos pontos do telêmetro a laser do banco de dados. Pontos do telêmetro a laser possuem uma observação do telêmetro a laser.

Para visualizar um ponto observado usando um telêmetro a laser:

1.	Na Visualização do levantamento, abra a janela Propriedades.

2.	Selecione uma observação do telêmetro a laser.

Use os botões do menu para visualizar os seguintes detalhes de observações do telêmetro a laser:


Calibração e Parâmetros da Transformação do Ajuste

Como ...

Quando se executa uma calibração do local GPS, os parâmetros da calibração são computados para estabelecer o relacionamento entre pontos WGS-84 (pontos GPS) e posições do grid local no banco de dados.

Quando se executa um ajuste de rede compelido (se tiver instalado o módulo Ajuste da Rede), os parâmetros da transformação são computados. Estes parâmetros estabelecem o relacionamento entre observações e controle fixo.

O software Trimble Geomatics Office somente permite parâmetros de ajuste horizontal e vertical derivados de uma calibração de local GPS ou parâmetros de transformação do ajuste derivados de um ajuste. Se tiver executado um ajuste e computado parâmetros da transformação do ajuste e tentar então executar uma calibração do local GPS, lhe será avisado que os parâmetros serão removidos se a calibração continuar a ser feita.

NOTA: Não pode-se transferir parâmetros de transformação do ajuste derivados de um ajuste para o software Trimble Survey Controller. Para fazê-lo, requer-se executar uma calibração de local GPS usando coordenadas de calibração salvadas (como pontos WGS-84) derivadas de um ajuste no datum WGS e coordenadas ajustadas (como pontos do grid), derivadas de uma Ajuste de Rede compelido no datum local.


Referências

Livros

Barry, B. Austin. 1991. Errors in Practical Measurement in Surveying, Engineering, and Technology. Editado por M. D. Morris. ISBN 0-910845-47-6. Rancho Cordova: Landmark Enterprises.

Hofmann-Wellenhof, B., Herbert Lichtenegger, e James Collins. 1993. Global Positioning System Theory and Practice. Segunda Edição. ISBN: 3-211-82477-4 e ISBN 0-387-82477-4. New York: Springer-Verlag Wien.

Leick, Alfred. 1995. GPS Satellite Surveying. Segunda Edição. ISBN: 0-471-30626-6. New York: John Wiley and Sons, Inc.

Pope, Allen J. 1976. The Statistics of Residuals and the Detection of Outliers. NOAA Technical Report NOS65 NGS1, Rockville, MD.

Seeber, Günter. 1993. Satellite Geodesy, Foundations, Methods, and Applications. ISBN: 3-11-012753-9. Berlin and New York: Walter deGruyter.

U.S. National Geodetic Survey (NGS). 1986. Geodetic Glossary. Silver Spring, MD: NGS Publications Information Center.

Van Sickle, Jan. 1996. GPS for Land Surveyors. ISBN 1-575-04041-7. Ann Arbor: Ann Arbor Press, Inc.

Wolf, Paul R. and Charles D. Ghilani. 1997. Adjustment Computations: Statistics and Least Squares in Surveying and GIS. ISBN: 0471-16833-5. New York: John Wiley and Sons, Inc.

Outros Recursos - Publicações / Periódicos nos USA

As seguintes publicações são uma fonte útil de informação sobre engenharia civil e outros aspectos de levantamentos:

ACSM Bulletin. ISSN: 0747-9417. Publicado bimestralmente por American Congress on Surveying and Mapping, 5410 Grosvenor Land, Suite 100, Bethesda, MD 20814-2144 USA.

GPS World: News and Applications of the Global Positioning System. ISSN: 1048-5104. Publicado mensalmente por Advanstar Communications Inc. Subscription offices: P.O. Box 6148, Duluth, MN 55806-6148 USA.

P.O.B. - Point of Beginning. ISSN: 0739-3865. Publicado mensalmente por Business News Publishing Company, 755 W. Big Beaver Road, Ste. 1000, Troy, MI 48084 USA.

Professional Surveyor. ISSN: 0278-1425. Publicado dez vezes ao ano por Professional Surveyors Publishing Company, Inc., 1713-J Rosemont Avenue, Frederick, MD 21702-4170 USA.


O Navegador do Zoom

O Navegador do Zoom aparece como uma pequena janela na base da barra do Projeto. Ele reflete os dados exibidos na janela de gráficos principal do Trimble Geomatics Office. Se você usar qualquer ferramenta de zoom na janela principal, a caixa do Navegador do Zoom muda para refletir isso. Ela sempre exibe as extensões do seu projeto.

Ocultando (ou mostrando) o Navegador do Zoom

Para ocultar (ou mostrar) o Navegador do Zoom na barra do Trimble Geomatics Office:

1.	Na barra do Projeto, clique o lado direito.

Aparece o menu de atalho.

2.	Selecione o Navegador do Zoom.

Uso do Navegador do Zoom

Para usar o Navegador do Zoom:

  Clique numa área do projeto do Navegador do Zoom.

NOTA: Esta área torna-se o centro da janela principal de gráficos.

Para usar o Navegador de Zoom para fazer zoom:

1.	No Navegador de Zoom, arraste a caixa em torno da área de interesse.

A janela de gráficos principal exibe os mesmos dados.

2.	Ao apontar para o centro da caixa do Navegador do Zoom, o ponteiro torna-se uma [image]. Isso significa que você pode arrastar a caixa sobre a área do projeto sem mudar o zoom. A visualização do projeto da janela principal de gráficos reflete estes movimentos.

  Para fazer um zoom para extensões do projeto, clique duas vezes no Navegador do Zoom.

NOTA: Se você tiver um mouse com girador, pode usar o girador para mudar o tamanho da caixa do Navegador do Zoom.


Barra do Projeto - Perspectiva Geral

A barra do projeto consiste de grupos nomeados que especificam atalhos para tarefas usadas com freqüência no Trimble Geomatics Office. Cada atalho é disponível num menu.

Para acessar rapidamente uma tarefa:

1.	Clique um atalho na barra do Projeto.

2.	Clique um grupo para mover para um grupo diferente de atalhos.

Para mudar o tamanho do ícones de atalho:

1.	Clique o lado direito na área da barra do Projeto.

Aparece um menu de atalho.

2.	Selecione Ícones Grandes ou Ícones Pequenos.

Para ocultar (ou mostrar) a barra do Projeto, faça um dos seguintes:

  Clique o lado direito na área da barra do Projeto.

Aparece um menu de atalho. Selecione Ocultar.

  Selecione Visualizar / Barra do projeto

Na barra do projeto, clique o ícone da barra do Projeto

Quando não existe um projeto aberto, os grupos Projetos e Utilidades são disponíveis. Quando um projeto está aberto, a lista completa de grupos (fora do grupo de utilidades) fica disponível:

  Grupo Trimble Survey

  Grupo Projetos

  Grupo Importar

  Grupo Processar (se você tem instalado o módulo de Processamento da Linha de Base WAVE da Trimble)

  Grupo Ajuste (se você tiver instalado o módulo de Ajuste da Rede da Trimble)

  Grupo Exportar

  Grupo CAD

  Grupo Utilidades


Barra do Projeto - Grupo Trimble Survey

O grupo Trimble Survey contém atalhos que fornecem acesso rápido a tarefas comumente usadas em Visualização do Levantamento. Os atalhos são especificados na ordem que são geralmente usados.


Barra do Projeto - Grupo Projetos

O grupo Projetos contém atalhos que fornecem acesso rápido para comandos do projeto.


Barra do Projeto - Grupo Importar

O grupo Importar contém atalhos que fornecem acesso rápido para importação de fontes de dados de levantamento usadas com freqüência.


Barra do Projeto - Grupo Processo

O grupo Processo contém atalhos que fornecem acesso rápido a tarefas de processamento da linha da base usadas com freqüência.

NOTA: O módulo Processamento da linha da base deve estar instalado.


Barra do Projeto - Grupo Ajuste

O grupo Ajuste contém atalhos que fornecem acesso rápido para tarefas de ajuste usadas com freqüência.

NOTA: O módulo Ajuste da Rede deve estar instalado.


Barra do Projeto - Grupo Exportar

O grupo Exportar contém atalhos que fornecem acesso rápido para exportação de dados no projeto para formatos de dados usados com freqüência.


Barra do Projeto - Grupo CAD

O grupo CAD contém atalhos que fornecem acesso rápido para tarefas usadas com freqüência na Visualização do Plano.


Barra do Projeto - Grupo Utilidades

O grupo Utilidades contém atalhos que fornecem acesso rápido para utilidades usadas com freqüência incluídas no sistema do Trimble Geomatics Office.


Atributos - Perspectiva geral
Atributos − Perspectiva geral

Outras Informações

Como ...	Diálogo	Ver também
Perspectiva geral

Um atributo é um fragmento de uma informação descritiva sobre um código de característica. Por exemplo, com o código de característica ‘árvore’, pode-se ter atributos da espécie, altura, diâmetro e condição. Cada código de característica ‘árvore’ coletado no campo terá os seus próprios valores para estes atributos.

O Trimble Geomatics Office suporta o gerenciamento de informação de atributo com pontos. Com o Trimble Geomatics Office, pode-se:

  usar a utilidade Editor de Características e Atributos da Trimble para criar bibliotecas de características e atributos contendo definições de atributo

  importar arquivos do Survey Controller (*.dc) que contenham atributos

  visualizar e editar as informações de atributos

  adicionar atributos

  exportar os dados para o formato do Sistema de Informações Geográficas (GIS)

  criar um relatório de atributos

Use a utilidade Editor de Características e Atributos para definir um grupo de atributos para um código de característica. Para cada atributo, deve-se definir um nome e tipo de atributo. O tipo de atributo determina o formato das informações do atributo. Por exemplo, se o atributo para ‘árvore’ é altura, o tipo do atributo é ‘numérico’.

Pode-se também usar arquivos de Dicionário de Dados (*.ddf) para coletar informações de atributos. Para criar arquivos .ddf, use a utilidade Editor do Dicionário de Dados da Trimble. Ele é parte do software GPS Pathfinder® Office.

Fluxo do trabalho

O fluxo do trabalho para a gestão de informações do atributo com o Trimble Geomatics Office consiste no seguinte:

1.	Criar um arquivo da Biblioteca de Características e Atributos (*.fcl) no Editor de Características e Atributos.

2.	No software Trimble Geomatics Office, configurar o projeto para atributos, selecionando o arquivo .fcl ou .ddf.

3. 	Transferir o .fcl ou .ddf para o Trimble Survey Controller (versão 7.00 ou mais recente).

4.	Coletar os dados no campo.

5.	Transferir os dados de campo para o Trimble Geomatics Office.

6.	Exportar os dados num formato GIS ou ascii personalizado.


Biblioteca de Características e Atributos - Perspectiva geral
Biblioteca de Características e Atributos − Perspectiva geral

Outras Informações

 Como ...

Perspectiva geral

Um arquivo da Biblioteca de Características e Atributos (*.fcl) é um arquivo de texto que contém as definições de códigos de característica, atributos, estilos de CAD e códigos de controle. Para editar bibliotecas de características e atributos, use a utilidade Editor de Características e Atributos da Trimble.

Bibliotecas de Características e Atributos são grupos de instruções que descrevem operações que devem ser efetuadas quando códigos de características são processados. Por exemplo:

  designando um estilo específico de ponto para um ponto

  criando linhas entre pontos

  definindo atributos que devem ser coletados no campo

  anotando pontos e linhas

Para maiores informações sobre a criação de bibliotecas de características e atributos, consulte a Ajuda online do Editor de Características e Atributos da Trimble.

Use um arquivo da Biblioteca de Características e Atributos (*.fcl) para:

  processar códigos de característica

  definir atributos para a coleta de dados no campo

Processamento do Código de Característica

Para informações sobre o uso de uma biblioteca de características e atributos para processar códigos de característica, consulte o tópico Códigos de Característica – Perspectiva geral.

Atributos

Para configurar um projeto para atributos, use o diálogo Propriedades do Projeto. Pode-se selecionar um arquivo da Biblioteca de Características e Atributos (*.fcl) ou um arquivo do Dicionário de Dados (*ddf).


Configurando um Projeto para Atributos

 Perspectiva geral e Outras informações

Para usar atributos no Trimble Geomatics Office, deve-se configurar o projeto para atributos. Para fazer isso, selecione o arquivo da Biblioteca de Características e Atributos (*.fcl) ou do Dicionário de Dados (*.ddf) que deseja usar.

SUGESTÃO: Para maiores informações sobre como selecionar um arquivo .fcl ou .ddf, consulte o tópico Para configurar um projeto para atributos.

O Trimble Geomatics Office cria uma tabela para cada código de característica com atributos. O arquivo da biblioteca não está armazenado no projeto. Isso significa que o projeto não é atualizado se mudanças forem feitas na biblioteca.

Mudando a biblioteca de características e atributos para o projeto

Para mudar a Biblioteca de Características e Atributos para o projeto, selecione-a como descrito acima. No entanto, o Trimble Geomatics Office não lhe permite fazer isso após:

  a importação de um arquivo do Survey Controller (*.dc) que contenha atributos

  a adição de um registro de atributo no Trimble Geomatics Office

Isso porque as tabelas de característica existentes são apagadas e novas tabelas são criadas com o uso da biblioteca selecionada.

Se você realmente necessitar mudar a biblioteca de características e atributos para um projeto, pode-se apagar todos os pontos com atributos, voltar a abrir o projeto e então selecionar uma nova biblioteca de características e atributos.

O Trimble Survey Controller

Certifique-se de que a biblioteca de características e atributos (ou arquivo do dicionário de dados) usado no Trimble Geomatics Office é o mesmo daquele usado no campo com o Trimble Survey Controller. Se você usar bibliotecas diferentes, alguns dados de atributos podem não ser importados.

Para informações sobre a importação de dados com atributos quando as bibliotecas são diferentes, consulte Importando Atributos com Definições Diferentes.


Arquivos do Dicionário de Dados - Perspectiva geral

Outras Informações

 Ver também

Perspectiva geral

Um arquivo do Dicionário de Dados é um arquivo que define características e atributos associados para características.

Ele pode ser usado como uma alternativa para um arquivo de Características e Atributos.

Se você possuir a utilidade Editor de Dicionário de Dados (que é parte do GPS Pathfinder Office), pode-se usá-lo para criar arquivos do Dicionário de Dados (*.ddf). Um arquivo .ddf contém definições de características e atributos.

Usando um arquivo .ddf para configurar um projeto para atributos

Pode-se usar um arquivo .ddf para configurar um projeto do Trimble Geomatics Office para atributos. Se fizer isso, todas características linha e área do arquivo .ddf são tratadas como características ponto. Isso porque o Trimble Geomatics Office e o Trimble Survey Controller (versão 7.00 ou mais recente) somente suporta características de ponto.

Usando um arquivo .ddf no Editor de Características e Atributos

NOTA: A biblioteca de características e atributos usada para a configuração de um projeto para atributos não deve ser a mesma biblioteca de característica e atributos usada para o processamento de codificação da característica. No entanto, se forem coletados dados do atributo no campo com a utilização de um arquivo de Características e Atributos, use a mesma para processar os códigos de característica.

Pode-se importar arquivos .ddf para arquivos da Biblioteca de Características e Atributos (*.fcl) usando a utilidade Editor de Características e Atributos. Pode-se também exportar um arquivo .fcl como sendo um arquivo .ddf. Estas tarefas são úteis se desejar utilizar arquivos .ddf com a utilidade Editor do Dicionário de Dados.

Usando um arquivo .ddf no Trimble Survey Controller

Pode-se usar um arquivo .ddf no campo como os atributos que definem a biblioteca. Para fazer isso, transfira um arquvio .ddf para o Trimble Survey Controller.


Importando Atributos com Diferentes Definições

 Perspectiva geral e Outras Informações

Quando se importa um arquivo do Survey Controller (*.dc) contendo atributos, as definições de atributos do arquivo .dc são comparadas com as definições de atributos do projeto. Se elas são diferentes em qualquer aspecto, aparece um diálogo. Ele lhe pergunta se deseja:

  importar informações de atributo comuns aos arquivos de bibliotecas de características e atributos ou de dicionário de dados.

Se selecionar esta opção e mudar qualquer definição de atributo no arquivo da Biblioteca de Características e Atributos para o projeto após a transferência do arquivo ao Trimble Survey Controller, as informações do atributo para aquele código de característica serão perdidas. Se somente foram adicionados novos códigos de característica, dados não serão perdidos.

  inserir pontos com códigos de característica, mas sem informações sobre o atributo

  cancelar a importação

Para evitar que essa mensagem apareça, atente para que o arquivo usado para configurar um projeto para atributos seja o mesmo daquele usado no Trimble Survey Controller.


Visualizando/Editando Atributos no Trimble Geomatics Office

 Perspectiva geral e Outras Informações

Para visualizar e editar atributos para um ponto no Trimble Geomatics Office, use a janela Propriedades. Se um projeto foi configurado para atributos no diálogo Propriedades do Projeto, aparece a guia Atributo na janela Propriedades. Se houverem mais de uma característica com atributos para o ponto selecionado, use a lista de caída para selecionar a característica para a qual deseja visualizar os atributos. Para editar um valor de atributo, clique o campo apropriado na coluna Valor.

Para atributos do menu:

  Selecione um valor da lista de valores de atributos disponíveis.

Para todos os outros tipos de atributos:

  Insira o novo valor para o atributo com o teclado. Não pode-se utilizar o preenchimento de campo para atributos.

NOTA: Ao editar informações do atributo, o Trimble Geomatics Office verifica a definição da biblioteca de características e atributos para garantir que o novo valor é válido.


Copiando / Cortando / Colando Pontos com Atributos entre Projetos

 Ver também

Para copiar ou cortar e colar pontos com atributos, as bibliotecas de características e atributos usadas para configurar os dois projetos devem ser as mesmas.

Se as bibliotecas de características e atributos forem diferentes, mas tiverem em comum definições de atributos, você será avisado e lhe será dada a opção entre cancelar a colagem, colar somente pontos (sem atributos) ou colar pontos com atributos comuns às duas bibliotecas. O Trimble Geomatics Office registra os atributos que não foram colados no relatório Import.rpt.

Não pode-se selecionar uma biblioteca diferente para configurar um projeto para atributos se o projeto já possuir pontos com atributos. Isso porque as definições do atributo já foram configuradas. No entanto, pode-se criar um novo projeto, definir as novas definições do atributo na Biblioteca de Características e Atributos (ou arquivo do Dicionário de Dados) e copiar então os pontos com atributos do projeto existente para o novo projeto.

NOTA: Copiar e cortar e colar somente funciona se um dentre os seguintes for verdadeiro:

  Todos pontos copiados ou cortados possuem elevações.

  O projeto possui uma elevação padrão especificada. Este padrão é usado para todo ponto com elevações nulas.

Isso porque as coordenadas para os pontos que estão sendo copiados / cortados são reduzidas para o elipsóide WGS-84. O sistema de coordenadas do projeto que está recebendo a colagem é aplicado aos pontos colados. Se o projeto ao qual se está colando contiver um sistema de coordenadas diferente, aparecem as coordenadas corretas.


Diferenças Entre Arquivos .fcl e .ddf

Pode-se usar um arquivo de Biblioteca de Características e Atributos (*.fcl) ou arquivo de Dicionário de Dados (*.ddf) no seu projeto Trimble Geomatics Office. Para selecionar um arquivo para o projeto atual, selecione Arquivo / Propriedades do Projeto / guia Geral. As diferenças entre os dois arquivos são descritas abaixo.

Arquivos .fcl

Um arquivo .fcl pode conter configurações CAD (por exemplo estilos de ponto, estilos de linha, estilos de anotação e códigos de controle) para codificação de características, como também para definições de atributos. Ao selecionar um arquivo .fcl para configurar um projeto para atributos, o Trimble Geomatics Office usa as definições do atributo para criar as tabelas requeridas.

O mesmo processo ocorre se você escolher exportar um arquivo .fcl com atributos para o Trimble Survey Controller (versão 7.00 ou mais atual).

Se você desejar usar códigos de característica e coletar atributos, use os arquivos .fcl. Se você já possuir um arquivo .ddf mas quiser codificar a característica, é possível importar o arquivo .ddf para um arquivo .fcl da utilidade Editor de Características e Atributos e então usar o arquivo .fcl.

Para maiores informações, consulte a Ajuda do Editor de Características e Atributos.

Arquivos .ddf

Um arquivo .ddf não pode conter configurações CAD para codificação de característica. Ele somente contém definições de características e atributos. Se códigos de características forem processados a partir de um arquivo .ddf, não serão designados nenhum ponto, linha ou anotação.

Pode-se criar um arquivo .ddf a partir da utilidade Editor do Dicionário de Dados (se você possuir o GPS Pathfinder Office) ou da utilidade Editor de Características e Atributos da no Trimble Geomatics Office (selecione Arquivo / Exportar no Editor de Características e Atributos para exportar um arquivo .ddf.)


Transferência de Dados - Perspectiva geral

A utilidade Data Transfer da Trimble é o software que é usado para transferir dados entre o Trimble Geomatics Office e um dispositivo. Um dispositivo é um survey controller, receptor Trimble GPS, uma estação total convencional, coletor de dados formato SDR, nível digital, unidade de controle ou Cartão PC. Antes que você possa transferir dados usando a utilidade Transferência de Dados, você necessita estabelecer o dispositivo requerido.

Se você tem uma configuração de dispositivo, para acessar a utilidade Data Transfer de dentro do Timble Geomatics Office, faça o seguinte:

1.	Selecione Arquivo / Importe ou File / Exporte—dependendo do que você quer fazer.  	O diálogo apropriado aparece.

2.	Selecione a opção requerida.

Para abrir a utilidade Data Transfer, selecione uma opção que requeira uma conexão com um dispositivo.

O diálogo Salvar Como ou Abrir aparece, dependendo do que você tiver escolhido.

3.	Selecione o dispositivo requerido para o qual ou do qual você quer transferir dados.

Acessando a utilidade Data Transfer de fora de um projeto

Se você não tem um projeto aberto, você pode transferir arquivos entre o seu computador e um dispositivo.

Para fazer isso:

  	Desde o Trimble Geomatics Office, selecione Utilidades / Data Transfer.

Acessando a utilidade Data Transfer de fora do Trimble Geomatics Office

Você pode transferir arquivos do seu computador para um dispositivo de fora do Trimble Geomatics Office.

Para fazer isso:

  	Selecione Início / Programas / Data Transfer.


Dispositivos - Perspectiva geral

Para transferir dados entre um projeto Geomatics Office e um dispositivo; deve-se configurar devidamente o dispositivo.

Quando você estabelece um dispositivo, ele irá sempre estar disponível durante importação ou exportação. Para mais informações, consulte a ajuda do Data Transfer.


Diálogo de Verificação do DAT

Use este diálogo para verificar e corrigir os valores no(s) arquivos GPS antes de importar as observações GPS dentro de um projeto Trimble Geomatics Office.

NOTA: Quaisquer mudanças que você faça no diálogo somente afetam os dados que são importados. As mudanças não afetam o arquivo de dados GPS (*.dat).

O diálogo aparece quando você importa:

  arquivos de dados GPS (*.dat)

  arquivos RINEX (*.XXo, *.XXn, *.obs, *.nav)

  Arquivos DC com .dat arquivos associados

Use

Desmarque esta caixa de verificação se você não quiser os dados transferidos para o projeto.

Nome

Exibe o nome do ponto onde os dados tenham sido observados. Se não houver nenhum nome atribuído ao ponto no arquivo, a estação ID é usada. Use o teclado para digitar um nome para mudar esse campo.

Nome do Arquivo

Exibe a fonte de dados do arquivo.

Hora de Início

Exibe a hora de início e data da ocupação.

Hora de Parada

Exibe a hora de início e data da ocupação.

Tipo do Receptor

Lista o tipo de receptor GPS usado para coletar os dados.

Receptor S/N

Exibe o número serial do receptor. Você pode editar esse número.

Altura da Antena

Exibe a altura da antena digitada para a ocupação. Se a altura tiver sido incorretamente digitada durante a ocupação, use o teclado para digitar um valor para mudar este campo.

Tipo de Antena

Exibe o tipo de antena conectada ao receptor. Se a antena tiver sido incorretamente digitada durante a ocupação, selecione um tipo de antena da lista para mudar este campo.

Medido para

Exibe para onde a altura da antena foi medida. Se o método tiver sido incorretamente digitado durante a ocupação, selecione uma opção da lista para mudar este campo.

Código de Característica

Exibe o valor do código de característica atribuído ao ponto. Use o teclado para digitar um novo valor para mudar este campo.

Redefinir

Clique Redefinir para restaurar as configurações originais.

SUGESTÃO: Para aplicar as mesmas mudanças a mais de um ponto, mantenha a tecla Ctrl pressionada e selecione os campos definidos sob a coluna que você quer que seja modificada. Pressione Shift se você quiser selecionar linhas seqüenciais. Digite ou selecione um valor em um campo selecionado que você queira aplicado a todos os campos na seleção.


Diálogo de Importação de Nível Digital

 Veja Também

Use o diálogo de Importação de Nível Digital para:

  Exibir os dados de um arquivo de Nível Digital.

  Determinar quais pontos entre os quais você quer elevações delta computadas.

  Validar a elevação do ponto inicial.

  Determinar erros de fechamento em pontos conhecidos.

  Validar nomes de pontos

O diálogo de Importação de Nível Digital aparece quando você importa Arquivos de Nível Digital (*.dat, *.raw). Para fazer isso:

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	No tab do Levantamento, selecione Arquivos de Nível Digital (*.dat, *.raw). O diálogo Abrir aparece.

3.	Selecione o arquivo de Nível Digital.

4.	O diálogo Importação de Nível Digital aparece.

Quaisquer mudanças que você faça no diálogo apenas afetam os dados que são importados. As mudanças não afetam o arquivo de Nível Digital (*.dat, *.raw).

NOTA: Ao importar dados do nível digital, pode-se especificar como pontos duplicados são tratados. Por padrão, o software Trimble Geomatics Office une os pontos com o mesmo nome na importação de modo que pontos duplicados não são criados. No diálogo Opções do ponto, pode-se usar a opção Juntar pontos duplicados dentro da tolerância para especificar a tolerância vertical com a qual os pontos duplicados devem ser unidos. A tolerância horizontal não é usada quando se importam dados de nível digital.

NOTA: Pode-se importar diretamente dados de um dispositivo de nível Digital DiNi. Quando fizer isso, aparece o diálogo Importar Nível Digital.

SUGESTÃO: Ao coletar dados de importação do nível digital, armazene pontos que deseja importar para o Trimble Geomatics Office com um único prefixo ou sufixo exclusivo. Por exemplo, armazene todos os pontos que você quer usar como pontos de estação com o prefixo STN. Isto permite que você facilmente selecione pontos usando o botão Selecione por Filtro no diálogo de Importação de Nível Digital ou pontos que você não quer que sejam importados.

No grupo de Elevação, você pode visualizar os seguintes campos:

Ponto Inicial

O nome do ponto inicial. O ponto inicial em uma execução de nível é indicado com o ícone de ponto inicial.

Elevação

A elevação do ponto inicial. Você pode editar a elevação de um ponto inicial quando o ponto é selecionado na tabela. Selecionando outro circuito de nível na tabela mostra o ponto inicial para aquele circuito no grupo de elevação. O final de um circuito de nível e o início de outro circuito é mostrado por uma linha preta, horizontal, espessa na tabela.

Qualidade da Elevação

A qualidade do campo de elevação. Para mudar a qualidade da elevação, clique o botão Qualidade.

Os dados na tabela de Nível Digital são mostrados na ordem em que as observações foram feitas. Você pode visualizar as seguintes colunas:

Coluna	O que mostra
Pontos de Estação	O nome do ponto e se o ponto foi selecionado como um ponto de estação para importação no Trimble Geomatics Office.  Quando você importa um arquivo, todas as observações são selecionadas pelo padrão. O nome do ponto de estação é editável.
BS	A observação de nível para a visada atrás.
IS	A observação de nível para uma visada intermediária. Você não pode selecionar a visada intermediária até que a visada atrás correspondente seja selecionada.
FS	A observação de nível para a visada adiante.
Elevação	A elevação do ponto. Um ícone é usado para indicar qual ponto era usado como o ponto inicial para o cálculo da elevação. Isto corresponde ao ponto inicial que é mostrado no grupo de Elevação. A elevação do ponto inicial em cada circuito pode ser editada desde o grupo de elevação. Se um ponto não tem uma elevação então um ponto inicial não é selecionado para computar a elevação do ponto.
Distância	A distância para a visada atrás, visada adiante ou visada intermediária.
Descrição	A descrição do ponto sendo nivelado.
Deltas Piquetados	A diferença em elevação entre um ponto que foi piquetado e a altura do desenho para a localização do ponto.

Para selecionar pontos na tabela, faça um dentre os seguintes:

  Selecione a caixa de verificação na coluna do Ponto de Estação.

  Clique no cabeçalho da coluna do Ponto de Estação. Você pode selecionar todos os pontos na tabela clicando o topo da coluna e então selecionando o primeiro ponto na coluna.

  Clique Selecione por Filtro.

Uma vez que você especifique uma seleção, as seguintes regras aplicam-se:

 Você não pode selecionar uma visada intermediária até que a visada atrás precedente seja selecionada.

  Se houver mais de uma visada com o mesmo nome, ele selecionará todas as outras observações (exceto para visadas intermediárias) com o mesmo nome.

Quando você clicar Selecione por Filtro, o diálogo Definir Estações de Nível aparece.

NOTA: Os seguintes Nível Digital e Formatos de Armazenagem são suportados:

NOTA: O Trimble Geomatics Office não suporta registros de medições Leica os quais sejam gravados fora da execução de nível, isto é, 330 registros.


Definir diálogos de Estações de Nível

Mais informações

 Veja Também

O diálogo Definir Estações de Nível aparece quando você clica Selecionar por Filtro no Diálogo de Importação de Nível Digital. Use esta opção de filtro para selecionar ou desmarcar pontos de estação. Por padrão, todos os pontos de estação são selecionados no diálogo de Importação de Nível Digital.

SUGESTÃO: Quando você coleta dados de importação de nível digital, pontos de armazenagem que você quer importar no Trimble Geomatics Office com um prefixo ou sufixo exclusivo. Por exemplo, armazene todos os pontos que você quer usar como pontos de estação com o prefixo, STN. Isto permite que você facilmente selecione pontos usando o  botão Selecionar por Filtro no Diálogo de Importação de Nível Digital.

As opções são:

Selecionar pontos com

Use esta opção para selecionar pontos de estação na coluna de Pontos de Estação do diálogo de Importação de Nível Digital. Por exemplo, você pode selecionar pontos de estação com um prefixo ou sufixo particular.

NOTA: Todos pontos que não possuam o prefixo ou sufixo determinado são limpados.

Pontos Não selecionados com

Use esta opção para desmarcar, para pontos em particular, a caixa de verificação na coluna dos Pontos de Estação no diálogo de Importação de Nível Digital.

NOTA: Todos pontos que não possuam o determinado prefixo ou sufixo são verificados.

Nome

Use este campo para selecionar pontos por nome. Você pode selecionar nomes de pontos usando os curingas ?, * ou #.

Descrição

Use este campo para selecionar pontos pela sua descrição. Novamente, você pode selecionar a descrição usando curingas.

Exemplo:

Se você não quiser que pontos com o prefixo ‘IS’ sejam selecionados na coluna de Pontos de Estação do Diálogo de Importação de Nível Digital:

1.	No diálogo Definir Estações de Nível, selecione os pontos Desmarcados com opção.

2.	Selecione a opção Nome e digite IS*.


Usar Observações de Nível em um Ajuste de Rede

Se você quer executar um ajuste de rede usando dados de nível, você deve Ter erros padrão de observação de nível definidos O software calcula erros padrão para as seguintes situações:

  Se você importar dados de nivel digital, o erro padrão (elevação delta) é calculado usando o número de voltas.

  Usando o Formato Trimble Data Exchange, o erro padrão é calculado se você incluir o número de voltas no formato de importação. Alternativamente, o erro padrão (elevação delta) pode ser usado diretamente do arquivo.

Se um erro padrão não é definido, as observações de nível não são marcadas para ajuste.

NOTA: Você pode entrar o erro padrão ou número de voltas para cada elevação delta na Janela de propriedades.


Diálogo Falha na exportação de GIS

Este diálogo aparece se a exportação GIS falhou.

Algumas razões possíveis são ilustradas na seguinte tabela:


Diálogo Selecionar modelo geóide - Diagnósticos de Problemas

Durante a importação de um arquivo de dispositivo, se o nome do modelo geóide referenciado no arquivo não condiz nenhum dos nomes do modelo geóide no banco de dados do sistema de coordenadas (Atual.csd), aparece este diálogo. Escolha o modelo geóide que deseja usar.

Este diálogo apareceu por causa de uma das seguintes razões:


Falta Impressora

Para imprimir ou desenhar a partir do Trimble Geomatics Office, deve-se contar com um impressora instalada no computador.

Para instalar uma impressora:

1.	Clique Iniciar.

2.	Selecionar Configuração / Impressoras.

Aparece a janela Impressoras.

3.	Clique duas vezes Adicionar impressora.

Siga as instruções de instalação para adicionar a impressora às configurações do Microsoft Windows.

Após a instalação da impressora, pode-se usá-la para imprimir a partir do software Trimble Geomatics Office.


Diálogo Selecionar Modelo do Grid do Datum

Se o nome do arquivo do Grid do datum combinado no arquivo importado não condizer com nenhum arquivo do Grid do datum no banco de dados do sistema de coordenadas, aparece este diálogo.

Use este diálogo para escolher o arquivo de datum combinado mais apropriado para ser usado no sistema.

Este diálogo apareceu por causa de uma das seguintes razões:


Mensagens e Diálogos sobre a importação de um arquivo Survey Controller (*.dc)

Ao importar um arquivo do Survey Controller (*.dc) para o Trimble Geomatics Office, o software efetua uma série de verificações no arquivo e lhe avisa se o arquivo .dc e o sistema de coordenadas não são os mesmos.

As seguintes listas de mensagens possíveis e diálogos que aparecem quando um arquivo .dc é importado:

  Um ou mais erros foram gerados na importação do arquivo

  O arquivo Característica e Atributo definido para este projeto é diferente

  Um arquivo de Característica e Atributo não foi definido para este projeto

  Incapaz de importar arquivo

  diálogo Definição da projeção padrão

  diálogo Pontos duplicados

  diálogo Sistema de Coordenadas do Projeto

  diálogo Selecionar grid do datum

  diálogo Selecionar modelo geóide


Mensagem - Um ou mais erros foram gerados na importação do arquivo

Durante a importação do arquivo, o software encontrou um ou mais erros.

Escolha uma das seguintes opções:

  Para descartar a mensagem e ignorar as mensagens de erro, clique Não.

  Para visualizar os erros, clique Sim.

Aparece um relatório de importação no visualizador HTML.

Clique o link das Mensagens de Erro ou role para baixo para a seção de Erros do relatório de importação para examinar os erros.

Se necessário, conserte os erros e volte a importar o arquivo.


Mensagem - O arquivo de Característica e Atributo definido para este projeto é diferente

Durante a importação de um arquivo Survey Controller (*.dc), a biblioteca de Características e Atributos ou arquivo de Dicionário de Dados usada para configurar o projeto para atributos demonstrou ser diferente daquele referenciado no arquivo .dc.

Escolha uma das seguintes opções:

  Clique Sim para importar os atributos comuns ao arquivo .dc e ao projeto.

  Clique Não para somente importar pontos do arquivo .dc.

Para impedir que esta mensagem apareça novamente, tenha certeza de que a biblioteca usada é a mesma usada para coletar informações de atributos no campo.


Mensagem - Arquivo de Característica e Atributo não foi definido para este projeto

Durante a importação de um arquivo Survey Controller (*.dc) que contém informações do atributo, o Trimble Geomatics Office não pôde encontrar uma biblioteca de Característica e Atributo ou arquivo de Dicionário de Dados definido para o projeto.

Escolha uma das seguintes opções:

  Clique OK para importar somente os dados de levantamento e ignorar as informações de atributo do arquivo .dc.

  Clique Cancelar para configurar o projeto para atributos no diálogo Propriedades do projeto / guia Características com a mesma biblioteca referenciada pelo arquivo .dc, então volte a importar o arquivo .dc.


Incapaz de importar arquivo

Durante a importação de um arquivo, um erro foi encontrado que resultou na não importação do arquivo. A seguinte mensagem aparece:

O arquivo <nome do arquivo> não pôde ser importado.

Verifique para ver se o arquivo está aberto em outra aplicação (por exemplo, um arquivo Survey Controller (*.dc) aberto na utilidade DC File Editor). Caso contrário, o arquivo pode estar corrupto.


    Códigos de Característica - Noções Gerais

Outras Informações

Como ...	Diálogo	Ver também
Noções Gerais

Códigos de característica são um modo de registrar pontos que necessitam ser agrupados para algum tipo de processamento. Por exemplo, pode-se codificar cada ponto coletado ao longo de uma linha cerca como “CERCA” de modo que, de volta ao escritório, todos os pontos com um código de característica de CERCA podem ser agrupados por um estilo particular de linha.

Para trabalhar com códigos de característica, você necessita:

  criar um arquivo de Biblioteca de Características e Atributos (*.fcl)

  transferir a livraria para o Trimble Survey Controller

  transferir a livraria para o TDS Survey Pro

  coletar dados usando códigos de característica da biblioteca

  transferir um arquivo do Survey Controller (*.dc) para o Trimble Geomatics Office

  processar códigos de característica

Uma biblioteca de características e atributos é um grupo de instruções.

Para criar novas bibliotecas, use a utilidade Editor de Características e Atributos. Pode-se criar tantas bibliotecas quantas forem necessárias. Quando códigos de característica são processados, as instruções na biblioteca dizem ao Trimble Geomatics Office o que fazer com os dados da seleção. Quando um valor de um campo de códigos de característica combina com uma condição especificada na biblioteca de características e atributos, as ações associadas são efetuadas.

Para maiores informações sobre bibliotecas de características e atributos, consulte a Ajuda  da Editor de Características e Atributos.


    Códigos de Característica - Ordem de processamento

 Noções Gerais e Outras Informações

Todos códigos de característica numa seleção atual são processados, mas o método de seleção usado dita a ordem do processamento.

Grupos de seleção

Quando um arquivo do Survey Controller (*.dc) é importado, um grupo de seleção é criado. Ele possui o mesmo nome com arquivo .dc e registra a ordem na qual pontos foram coletados no campo. Se você usar este grupo de seleção, códigos de característica são processados na ordem em que são coletados

Outros métodos de seleção

Você também pode fazer um dentre os seguintes:

  Escolha um comando do menu Selecionar.

  Clique um ponto.

Com estes métodos, o processamento pode não ocorrer na ordem em que os dados foram coletados.


    Códigos de Característica - Erros comuns

 Noções gerais e Outras informações

Os seguintes erros típicos podem ocorrer quando se usa códigos de características.

União incorreta devido ao uso de um grupo de seleção errado

A união incorreta pode ocorrer quando se usa uma seleção gráfica (ou o comando Selecionar / Todos) para pontos selecionados para codificação de características ao invés de usar um grupo de seleção criado pelo sistema durante a importação de dados.

NOTA: Todas as entidades importadas de um arquivo são salvadas num grupo de seleção. No caso de arquivos do Survey Controller (*.dc), o grupo de seleção é nomeado de acordo com o nome interno do trabalho do arquivo. Isto é, o grupo de seleção criado mantém a ordem dos pontos importados. No caso de arquivos .dc, isso significa que o grupo de seleção mantém a ordem na qual o trabalho do levantamento foi efetuado. Isso é geralmente requerido para o processamento de código da característica.

Colocando os códigos de controle ao lado do código de ponto errado

Por exemplo: CURB1 LP ST

Aqui o ponto é uma observação de um poste de luz que está na linha meio-fio (CURB). A observação do meio-fio é o início de uma nova linha de meio-fio. O poste de luz é um ponto a ser desenhado com o símbolo apropriado. O comando ST (Start - iniciar) é aplicado ao código do ponto que segue (iso é, o poste de luz). Isso significa que a linha do último ponto etiquetado com CURB1 é levada ao ponto atual, que não é a intenção do código.

A codificação deveria ser: CURB1 ST LP ou LP CURB1 ST

Se o comando ST (Start – início) não for usado

Isso resulta em linhas contínuas entre pontos com o mesmo código traçadas onde elas não deveriam estar.


Códigos de Campo - Perspectiva Geral

Mais Informações

 Como ...

Perspectiva Geral

Códigos de campo são instruções especiais que pedem ao Trimble Geomatics Office que insira informações em campos. Códigos de informação também são usados para manipular a transferência de dados do banco de dados na importação e exportação de ASCII ou operações de relatórios personalizados. Códigos de campo são agrupados sob vários títulos. Para uma lista de cada título e ligações a detalhes de cada código de campo, consulte detalhes do Código de campo.

O Trimble Geomatics Office usa códigos de campo amplamente. Por exemplo, códigos de campo são usados em:

  o nome do projeto e data nos títulos do projeto quando se cria um novo projeto

  anotações

  etiquetas

  etiqueta personalizada do ponto

  importação e exportação de ASCII

  definições do relatório

Códigos de campo estão sempre contidos entre colchetes. Todos caracteres dentro de colchetes ‘[]’ são considerados como uma possível expressão de código de campo e substituídos pelo valor do código de campo correspondente, se houver um.

Por exemplo, pode-se instruir o Trimble Geomatics Office para personalizar a etiqueta de cada ponto do banco de dados com seu nome, usando o código de campo ‘[Nome]’. Estas etiquetas podem ser estendidas para incluir elevação através da adição do código de campo ‘[Elevação]’.

Por exemplo, com as configurações apropriadas [$Sistema de Coordenadas.Zona] poderia exibir "Zona de Califórnia 3 0403"e [Código de Característica] poderia exibir ‘ÁRVORE’. Outras informações tais como a data e hora do sistema atual do computador podem ser expressas através do uso de códigos de campo [Data] e [Hora].

Como outro exemplo, o código de campo Nome=[Nome] Elv=[Elevação] pode gerar o seguinte tipo de relatório:

Nome=3397 Elv=18.762

Nome=3396 Elv=18.702

Nome=3432 Elv=?

Nome=3436 Elv=16.372

Para acessar códigos de campo, clique o lado direito do mouse no campo que quiser adicionar o código de campo. Se códigos de campo estiverem disponíveis, aparece a opção Campos no menu de atalho.

Síntese

A sintaxe de um código de campo compreende em três elementos:

[contexto.nome:opções]

Use o componente contexto para eliminar toda ambigüidade entre os nomes do código de campo. Por exemplo, o código do campo [Nome] sempre exibe o nome do ponto para o ponto atual do banco de dados. Se desejar exibir o nome do projeto usando um código de campo, ele deve incluir o contexto do $Projeto (isto é, [$Projeto.Nome] é requerido). Caso contrário, o nome do ponto atual é devolvido.

O componente do contexto é opcional. Se for omitido, o Trimble Geomatics Office toma o contexto mais lógico.

As opções que podem ser incluídas com um código de campo geralmente são modificadores para o código de campo. Este componente também é opcional.


Detalhes do código de campo

 Perspectiva geral e Mais informações

Códigos de campo são agrupados em vários títulos:


Códigos de campo do banco de dados

 Perspectiva geral e Mais informações

Códigos de campo do banco de dados fornecem uma saída direta dos valores tanto armazenados como calculados do banco de dados. Opcionalmente, pode-se, opcionalmente, dar um prefixo a um código de campo do banco de dados com o nome da tabela que origina os dados.

Por exemplo, [Ponto.leste] extrai o valor Leste da tabela do ponto. Simplesmente especificando [Leste] também extrai o valor Leste da tabela do ponto desde que esta tabela seja a única tabela com um campo Leste. Se houver qualquer possibilidade de uma ambigüidade, o nome da tabela deve ser especificado.

Códigos de campo disponíveis são sensíveis ao contexto. Nomes válidos dependem do contexto mas, em geral, os códigos de campo associados com as tabelas do banco de dados são:

Códigos de campo do banco de dados

Um valor de campo do banco de dados é tomado diretamente do banco de dados (por exemplo, Leste).

Códigos de campo calculados

A seguinte tabela exibe os códigos de campo calculados que são válidos:

$Centro{<separador>} (alternativamente, $Centro{<separador>})

Para um arco, há um código de campo especial $Centro (alternativamente, $Centro), que exibe o nome do ponto central (se foi usado um ponto do banco de dados) ou as coordenadas do ponto central.

Pode-se especificar um caractere separador para visualização entre os valores de coordenadas. Se o caractere separador for omitido, será usado o caractere ‘separador de lista’ Painel de Controle do Microsoft Windows / Configurações regionais.

Primeira ordenada

O valor da Primeira ordenada (Leste ou Norte), dependendo da ordem da saída.

Segunda ordenada

O valor da Segunda ordenada (Norte ou Leste), dependendo da ordem de saída.

Nome da primeira ordenada

Nome da Primeira ordenada (Leste ou Norte), dependendo da ordem de saída.

Nome da segunda ordenada

O nome da Segunda ordenada (Leste ou Norte), dependendo da ordem de saída.


Códigos de Campo do Sistema

 Perspectiva geral e Mais informações

Os códigos de campo do sistema fornecem acesso à uma série de detalhes de todo o sistema e fornecem várias funções especiais. Use os códigos de campo do sistema para adicionar extra informação ao relatórios.

NOTA: Cada um destes códigos do sistema podem receber o prefixo $Sistema. Por exemplo, [$Sistema.hora] exibe a hora atual do computador no momento em que o código de campo foi usado.

Apesar de que estes códigos de campo não necessitem do prefixo $Sistema, use este prefixo para evitar ambigüidades. Por exemplo, [Hora] exibe o mesmo valor de [$Sistema.Hora].

Hora

Exibe a hora atual para o computador no momento em que o código de campo foi usado.

Data

Exibe a data atual do sistema para o computador no momento em que o código de campo foi usado.

Resumo

Exibe o resumo da ‘entidade atual’.

NOTA: O código de campo do resumo usado para um ponto é definido no arquivo Opções.ini associado ao projeto. Geralmente, ele usa os códigos do campo código do nome e característica no formulário [Nome] : [Código de Característica]

Espaço:<contagem>

Exibe um ou mais espaços.

Por exemplo, o código de campo [$Sistema.espaço:3] fornece três espaços.

Repetir<seqüência>:<contagem>

Exibe uma parte de texto repetida. O texto que deseja ver repetido deve estar entre colchetes de seta (< >).

Por exemplo, o código de campo [$Sistema.Repetir<->:80] exibe oitenta caracteres de menos. Para maiores informações, consulte Tela de entrada do parâmetro.

Coluna:<número>

Exibe espaços da posição atual numa linha de colunas específicas.

Por exemplo, o código de campo [$Sistema.Coluna:40] insere espaços até que a quadragésima coluna na linha atual seja alcançada.

Substituir<encontrar><substituir>

Substitui todas ocorrências do texto ‘encontrar’ especificado com o texto ‘substituir’. O código de campo Substituir<encontrar><substituir> deve seguir os campos que encontrar e substituir devem atuar. Se o código de campo Substituir aparecer antes do campo que deseje encontrar e substituir, o campo não será mudado.

Especificar o texto para substituir é opcional. Se ele não for especificado, o texto ‘encontrar’ será removido da linha.

Por exemplo, o código de campo [$Sistema.Substituir<°><graus>] encontra todas as ocorrências de um símbolo de grau na linha atual e os substitui com a palavra ‘graus’.

Caractere:código

Insere um caractere através da especificação seu código de caractere.

NOTA: A saída do caractere varia de acordo com a fonte a ser usada.

Por exemplo, o código de campo [$Sistema.Caractere:169] fornece © para a maioria dos campos.

Nome do usuário

Exibe o nome de logon da rede de usuários.

Nome do computador

Exibe a identificação da rede. Esta identificação pode ser mudada no sistema a partir do Painel de Controle do Microsoft Windows / Rede.

Sobre

Exibe o nome do produto e número da versão.

Por exemplo, Trimble Geomatics Office, Versão 1.00.

Nome da pasta

Existe uma série de diferentes códigos de campo que podem ser usados para fornecer nomes específicos de pastas relacionadas ao sistema.

Nomes disponíveis de pasta são:

Exportação de ASCII

Dois códigos de campo que são válidos somente para Exportação de ASCII são:

Contador	Exibe o número de códigos de campo usados. Ele pode ser usado para identificar individualmente cada valor exportado.
Linha	Exibe o número da linha num arquivo de exportação. É fornecido para permitir definições de ASCII que têm uma contagem de linha para cada linha do arquivo.


Diálogo Entrada do parâmetro

AVISO: A Trimble Navigation Limited suporta o uso ou modificação deste banco de dados somente pelo uso do software Trimble Geomatics Office de uso privado da Trimble. A Trimble não suporta ou autoriza o uso ou modificação ou garante o desempenho deste banco de dados através de outras aplicações de software. A Trimble pode, a qualquer momento, modificar o formato deste banco de dados, tornando-o incompatível com outras aplicações de software.

Este diálogo aparece se for necessário inserir um valor para completar uma pergunta de seleção ou código de campo. Selecione perguntas e códigos de campo que requerem que parâmetros possuem reticências (…). O diálogo aparece numa série de lugares do Trimble Geomatics Office.

Nome

Mostra os parâmetros que devem ser definidos.

Valor

Insira os valores requeridos.

Aparece um diálogo Entrada do parâmetro que se faz um relatório do banco de dados que foi baseado nos resultados de uma pergunta do banco de dados.


Códigos do Campo do projeto

 Perspectiva geral e Mais informações

Códigos de campo do projeto fornecem acesso para informações específicas do projeto. Use estes códigos de campo para adicionar extra informações aos relatórios.

NOTA: Cada um destes códigos de campo do projeto podem receber o prefixo $Projeto. Por exemplo, [$Projeto.projeção] exibe o nome do tipo de projeção do sistema de coordenadas usado para o projeto.

Apesar de que estes códigos de campo não devam receber o prefixo $Projeto, use este prefixo para evitar qualquer ambigüidade. Por exemplo, [Nome] exibe o mesmo valor que [$Projeto.Nome].

Nome

Exibe o nome do projeto usado para o projeto.

Caminho

Exibe o nome da pasta na qual os projetos estão armazenados.

NOTA: Este código de campo fornece a mesma saída da pasta $Sistema.Projetos

Projeção

Exibe o nome do tipo da projeção do sistema de coordenadas usadas para o projeto. Por exemplo, Transversal Mercator.

Auto nomear

Exibe o nome do atual nome auto do ponto.

Por exemplo, AUTO 0009 é devolvido se o nome auto do ponto designado antes era AUTO 0008

Camada CAD

Exibe o atual nome da camada CAD.

Unidades:tipo

Exibe o nome apropriado da unidade. Deve-se sempre fornecer um tipo.

NOTA: Distância, elevação, coordenada e ângulo são disponíveis.

Por exemplo, o código de campo [$Projeto.Unidades:Distância] exibe a unidade de distância como configurado para o sistema. Pode-se incluir o nome ‘:verboso’ para obter um completo valor do código de campo. Por exemplo, para obter ‘Metros’ ao invés de ‘m’, use [$Projeto.Unidades:Distância:verboso].

Tipo:distância

Exibe o tipo de exibição para a distância. Pode-se especificar isso em Arquivo / Proprieades do projeto / Unidades e Formato.

Tipo:LLA

Exibe o tipo de exibição para latitude, longitude e altura (local ou WGS-84).


Códigos de Campo de Títulos

 Perspectiva geral e Mais informações

Os códigos de campo de títulos fornecem acesso aos dados registrados nos campos de título do projeto da guia Detalhes do Projeto do diálogo Propriedades do Projeto. Use estes códigos de campo para adicionar extra informações aos relatórios.

NOTA: Cada um destes códigos de campo de títulos podem receber o prefixo $Títulos. Por exemplo, [$Títulos.Título] exibe o título do projeto atual.

Se qualquer dos títulos for mudado, os códigos disponíveis de campo de títulos mudam para refletir isso.

Apesar de que estes códigos de campo não necessitem do prefixo $Títulos, use este prefixo para evitar qualquer ambigüidade.

Os códigos de campo dos títulos são:

Título

Exibe o título para o projeto atual.

Descrição

Exibe uma descrição do projeto.

Referência

Exibe um número de referência do projeto de modo que se possa ligar o projeto ao processo de custo do escritório.

Agrimensor de campo

Esta saída de código de campo pode ser útil para uma referência futura.

Operador de computador

Esta saída de código de campo pode ser útil para uma referência futura.

Data

Exibe a data de criação do projeto. Isso é efetuado automaticamente usando o código do campo data no projeto modelo.

Datum Vertical

Exibe o datum vertical para o projeto.

Equipamento

Exibe os números seriais do equipamento.


Códigos de Campo do Sistema de Coordenadas

 Perspectiva geral e Mais informações

Os códigos de campo do sistema de coordenadas fornece acesso para detalhes específicos do sistema de coordenadas para o projeto. Use estes códigos de campo para adicionar informações extras aos relatórios.

NOTA: Cada um destes códigos de campo do sistema de coordenadas podem receber o prefixo $Sistema de coordenada. Por exemplo, [$Sistema de coordenada.Sistema] exibe o nome do sistema de coordenadas usado para o projeto.

Apesar de que estes códigos de campo não requeiram o prefixo $Sistema de coordenada, use este prefixo para evitar ambigüidades.

NOTA: Os códigos de campo $Sistema de coordenada retornam ‘Não selecionado’ quando não há disponíveis nenhuma configuração.

Sistema

Exibe o nome do sistema de coordenadas usado para o projeto (por exemplo, Plano de Estado dos Estados Unidos 1983).

Zona

Exibe o nome da zona do sistema de coordenada usado pelo projeto (por exemplo, Zona de Califórnia 3 0403).

Datum

Exibe o nome do datum sobre o qual está baseado a projeção do sistema de coordenadas (por exemplo, Norte Americano 1983 (Conus)).

Geóide

Exibe  o nome do modelo geóide usado pelo projeto (por exemplo, GEOID96 (Continental US)).

Local

Exibe o nome de toda definição do local para o projeto.


Códigos de Campo da Projeção

 Perspectiva geral e Maiores informações

Códigos de campo da projeção fornecem acesso a detalhes específicos da projeção usada dentro do sistema de coordenadas para o projeto. Use estes códigos de campo para adicionar informações extra a relatórios.

NOTA: Cada um destes códigos de campo da projeção podem receber o prefixo $Projeção. Por exemplo, [$Projeção.Nome] exibe o nome da projeção do sistema de coordenadas para o projeto.

Apesar de que estes códigos não necessitem do prefixo $Projeção, use este prefixo para evitar ambigüidades.

Nome

Exibe o nome do tipo de projeção (por exemplo, Transversal Mercator).

Os códigos de campo restantes da projeção retornam valores reais de valores do parâmetro para a projeção usada pelo projeto.

NOTA: Nem todos códigos de campo são válidos para todos tipos de projeção. Isto é, nem todos códigos de campo são válidos em cada caso. A seguinte lista de códigos de campo fornece a lista completa de todos parâmetros de projeção que podem ser retornados. Dependendo da projeção usada pelo projeto, somente códigos de campo apropriados retornam valores. Todos código de campo que não sejam válidos para a projeção retornam ‘N/A’ (que significa Não Aplicável).

Cada um dos seguintes códigos de campo exibem o valor que é detalhado:

Norte falso

O valor do norte falso para a projeção.

Leste falso

O valor do leste falso para a projeção.

Elevação falsa

O valor de altura do elipsóide na origem de uma projeção do plano.

Altura da origem

O valor da elevação na origem de uma projeção do plano.

Latitude da origem

A latitude da origem para a projeção.

Longitude da origem

A longitude da origem para a projeção.

Fator escala

O fator escala central para a projeção (baseado na unidade).

Azimute

O valor do azimute oblíquo para projeções Mercator Oblíquo e R.S.O. com uma definição de azimute oblíquo.

Convergência

O valor do ângulo oblíquo para projeções Mercator Oblíquo e R.S.O. com uma obliqüidade por definição de convergência da origem.

Paralelo 1

O paralelo norte usado na definição da projeção Paralelo do Lambert 2 e Cônico da Área Igual a Albers.

Paralelo 2

O paralelo sul usado na definição das projeções Paralelo do Lambert 2 e Cônico da Área Igual a Albers.

Latitude do Ponto 1, Longitude do Ponto 1, Latitude do Ponto 2, Longitude do Ponto 2

Estes quatro códigos de campo são usados por projeções do Mercator Obliquo e R.S.O. definidas por dois pontos, com estes campos sendo as posições do ponto da definição.


Códigos de Campo do Datum

 Perspectiva geral e Mais informações

Os códigos de campo do datum fornecem acesso a detalhes específicos do datum usado dentro do sistema de coordenadas para o projeto. Use estes códigos de campo para adicionar informações extra aos relatórios.

NOTA: Cada um destes códigos de campo do datum podem receber o prefixo $Datum. Por exemplo, [$Datum.Método] exibe o nome do método do datum usado para o projeto.

Apesar de que estes códigos de campo não necessitem do prefixo $Datum, use este prefixo para evitar ambigüidades.

NOTA: Nem todos códigos de campo são válidos para todos tipos de datum. Isto é, nem todos códigos de campo são válidos em cada caso. A seguinte lista de códigos de campo fornece a lista completa de todos parâmetros do datum que podem ser retornados. Dependendo do datum usado pelo projeto, somente códigos de campo apropriados retornam valores. Todos código de campo que não sejam válidos para a projeção retornam ‘N/A’ (que significa Não Aplicável).

Cada um dos seguintes códigos de campo exibem o valor detalhado:

Método

O nome do método de transformação do datum usado (por exemplo, três parâmetros).

Translação X

O valor de translação X (disponível para transformações do datum de três e sete parâmetros).

Translação Y

O valor de translação Y (disponível para transformações do datum de três e sete parâmetros).

Translação Z

O valor de translação Z (disponível para transformações do datum de três e sete parâmetros).

Rotação X

O valor de rotação X (disponível somente para transformações do datum de sete parâmetros).

Rotação Y

O valor de rotação Y (disponível somente para transformações do datum de sete parâmetros).

Rotação Z

O valor da rotação Z (disponível somente para transformações da datum de sete parâmetros).

Fator escala

O valor de escala da transformação da datum de sete parâmetros expresso em partes por milhão (ppm).

Nome do elipsóide

O nome do elipsóide usado no projeto.

Achatamento do elipsóide

O achatamento do elipsóide.

Eixo semi maior

O eixo semi maior do elipsóide.


Códigos do Campo da Calibração

 Perspectiva geral e Mais informações

Os códigos de campo da calibração fornecem acesso a detalhes específicos da calibração do local GPS usado no sistema de coordenadas para o projeto. Use estes códigos de campo para adicionar informação extra aos relatórios.

NOTA: Cada um destes códigos de campo de calibração podem receber o prefixo $Calibração. Por exemplo, [$Calibração.Rotação] exibe o valor de rotação para a transformação do plano na calibração do site GPS.

Apesar de que estes códigos de campo não necessitem do prefixo $Calibração, use este prefixo para evitar ambigüidades.

NOTA: Os códigos de campo de calibração são separados em dois grupos relacionados aos componentes horizontal e vertical de uma calibração de local GPS. Isto é, os componentes da calibração vertical são todos válidos se a calibração vertical estiver disponível no sistema de coordenadas. A seguinte lista de códigos de campo fornece a lista completa de todos parâmetros de calibração que podem ser retornados. Todos códigos de campo que não sejam válidos para a calibração retornam ‘N/A’ (que significa Não Aplicável).

Cada um dos códigos de campo apresentam o valor detalhado:

Norte da origem vert

O valor Norte do ponto de origem da transformação vertical.

Leste da origem vert

O valor Leste do ponto de origem da transformação vertical.

Correção const vert

A mudança vertical que é aplicada ao ponto de origem da transformação.

Norte da correção vert

A correção vertical por norte da unidade que é aplicada na transformação.

Leste da correção vert

A correção vertical por leste da unidade que é aplicada na transformação.

Norte da origem horz

O valor Norte do ponto de origem da transformação horizontal.

Leste da origem horz

O valor Leste do ponto de origem da transformação horizontal.

Norte da translação horz

O valor da translação horizontal aplicado na direção norte.

Leste da translação horz

O valor da translação horizontal aplicado na direção leste.

Fator escala

O fator escala (baseado na unidade) aplicado na transformação horizontal.

Rotação

A rotação aplicada na transformação horizontal.


Códigos de Campo Especiais

 Perspectiva geral e Mais informações

Estes códigos de campo especiais fornecem o acesso para uma série de detalhes de todo o computador e fornecem várias funções especiais. Use estes códigos de campo para adicionar informações extra a relatórios.

$Arquivo.nome do arquivo

Este código de campo exibe o conteúdo do campo especificado.

NOTA: Por causa de um conflito com o caractere dois pontos usados em algumas das definições de código de campo, não pode-se usar o caractere dois pontos (:) para definir uma unidade de letra do computador. Se necessitar especificar uma unidade, use <unidade> ao invés de ‘unidade:’. Por exemplo, <C> especifica a unidade C:.

O Trimble Geomatics Office usa alguns códigos de campo especiais para retornar pastas padrões.

$Residência (onde encontra-se o TGOffice.exe)

$Sistema (a sub-pasta do sistema sob $residência onde encontra-se o TGOffice.exe)

$Projeto (a pasta do projeto atual)

Por exemplo [$ARQUIVO.<c>\temp\dados.txt] ou [$arquivo.$sistema\meuarquivo.txt]

NOTA: Aqui também pode-se usar ‘:expandir’.

$Env.variável

Exibe a variável do ambiente nomeado.

$Chave.chave

Exibe a seqüência com a chave dada, tomada de um arquivo .ini (ou do Registro).

O formato do ‘nome’ do código de campo é chave{,seção}{;caminho}

Se a Seção for omitida, usa-se ‘Código de campo’, e se o caminho estiver omitido, considera-se $Sistema.

Como em $Arquivo, o caminho pode iniciar com qualquer um dos seguintes:

  $Residência

  $Sistema

  $Projeto

NOTA: Se o caminho for somente $Projeto, será usado o arquivo *.ini do projeto (Opções.ini é examinado primeiro, então tgo_v100.ini — estes são arquivos .ini associados com cada projeto). Se o caminho for somente $Sistema então a área do Trimble Geomatics Office é o registro usado.

$Texto.texto

Exibe o texto inserido. Isso é útil para relatórios.

Por exemplo, [$Texto.Código de característica:20] exibe a etiqueta ‘Código de característica’ posicionada a 20 espaços do ponto.


Códigos do Campo Formulário do Plano

 Perspectiva geral e Mais informações

Na definição dos formulários do plano são fornecidos vários códigos de campo especiais. Use-os dentro de uma definição de formulário do plano para lhe permitir exibir detalhes específicos ao traçado.

NOTA: Cada um destes códigos de campo do formulário podem receber o prefixo $traçado. Por exemplo, [$traçado.escala] exibe a escala do traçado.

Apesar de que estes códigos de campo não necessitem do prefixo $Traçado, use este prefixo para evitar ambigüidades.

Escala

Exibe a escala do traçado.

Primeiro nome de ordenada de origem

Exibe o primeiro nome de ordenada de origem. Por exemplo, com a opção Arquivo / Propriedades do Projeto / Unidades e Formato / Ordem da coordenada configurada para Primeiro Norte, [$traçado.Primeiro nome de ordenada de origem] apresenta ‘Norte’.

Segundo nome de ordenada de origem

Exibe o segundo nome de ordenada de origem. Por exemplo, com a opção Arquivo / Propriedades do projeto / Unidades e Formato / Ordem da coordenada configurada para Primeiro Norte, [$traçado. Segundo nome de ordenada de origem] exibe ‘Leste’.

Primeira ordenada de origem

Exibe o valor da primeira ordenada de origem. Por exemplo, com a opção Arquivo / Propriedades do projeto / Unidades e formato / Ordem da coordenada configurada para Primeiro Norte, [$traçado.Primeiro nome de ordenada de origem] exibe o valor Norte da origme do traçado.

Segunda ordenada de origem

Exibe o segundo valor da ordenada de origem. Por exemplo, com a opção Arquivo / Propriedades do projeto / Unidades e formato / Ordem da coordenada configurada para  Primeiro Norte, [$traçado. Segundo nome de ordenada de origem] exibe o valor Leste da origem do traçado.

Origem N

Exibe o valor Norte da origem do traçado.

Origem E

Exibe o valor Leste da origem do traçado.

Rotação

Exibe os valores de rotação especificados para o traçado.

Formulário do plano

Exibe o nome do formulário do plano como especificado na definição do formulário do plano.


Modificadores

 Perspectiva geral e Mais informações

Modificadores de código de campo são comandos especiais que podem ser usados para modificar a saída do código de campo.

Use modificadores para:

  obter a saída específica requerida do código de campo

  fornecer informação adicional de formatação ou parâmetros extra quando gerar dados

Uma série de modificadores podem ser usados para modificar um só código de campo. Quando vários números de modificadores são usados, eles geralmente são especificados como no seguinte:

	[Código de campo{:FormatoItem}{:FormatoItem}{:FormatoItem}{:FormatoItem}]
onde FormatoItem é um nome modificador ou uma camada do formato. As chaves indicm que estes são itens opcionais.

Quando se especifica um modificador, o sistema aceita maiúsclas, minúsculas ou mistos.

Os seguintes são possíveis modificadores:

Valor da largura (Numérico)

Especifica a largura da saída de um código de campo. Se o valor da largura do campo for negativo, a saída é justificada à direita, caso contrário é justificada à esquerda.

Por exemplo, se o Código de característica = "código de amostra ", [Código de característica:15] exibe "    código de amostra" (isto é, 15 caracteres de largura, obtido através da adição de quatro espaços no início).

Largura.Valores decimais (Numérico)

Especifica a largura e número de casas decimais para a saída de um código de campo. O modificador possui o formato L.D onde L é a largura e D é o número de casas decimais.

Se o valor da largura for negativo, o campo é justificado à esquerda, caso contrário ele é justificado à direita.

Se os valores da largura iniciam-se com um zero, mas que não sejam somente zero (por exemplo, 08,3), o completamento de caracteres é feito com um zero ao invés de um espaço.

Por exemplo,	se Elevação = 10.3258

Então	[Elevação:0.3] exibe 10.326

E	[Elevação:07.2] exibe 0010.33

Unidades

Valores de sufixos com suas unidades. Por exemplo, m para metros, ift para pés internacionais e sft para pés de levantamento americano. Pode-se usar este modificador para certificar-se de que as unidades são exibidas mesmo quando a opção Exibir unidades da guia Arquivo / Propriedades do projeto / Unidades e Formatos estiver configurada para Não.

Sem unidades

Garante que valores não recebem sufixos com suas unidades. Pode-se usar este modificador para certificar-se de que nenhuma unidade é exibida mesmo quando a opção Exibir unidades da guia Arquivo / Propriedades do projeto / Unidades e Formatos esteja configurada para Sim.

Letra maiúscula

Converte todos caracteres alfa retornados de um código de campo para maiúsculas.

Letra minúscula

Converte todos caracteres alfa retornados de um código de campo para minúsculas.

Direita

Justifica à direita a saída de um código de campo dentro da largura de campo especificada. Se nenhuma largura de campo foi especificada, nenhuma justificação é efetuada.

Esquerda

Justifica à esquerda a saída de um código de campo dentro da largura de campo especificada. Se nenhuma largura de campo foi especificada, nenhuma justificação é efetuada.

Centro (alternativamente, centro)

Justifica a saída de um código de campo dentro da largura de campo especificada. Se nenhuma largura de campo foi especificada, nenhuma justificação é efetuada.

Por exemplo, se o código Característica = "exemplo"

Então [Código de característica:11:Centro] exibe "  exemplo  ".

Ou seja, é retornado com dois espaços no início e dois espaços no fim, neste caso.

Exclusão

Corta a saída para a largura fornecida (início/fim se a largura for positiva ou negativa).

Por exemplo, se o código de característica = Exemplo

Então [códigocaracterística:4:Excluir] exibe ‘Examinar’

E [Códigocaracterística: - 4:Excluir] exibe ‘mple’

Expandir

Expande todos códigos de campo encontrados no texto, que foram retornados pelo código de campo, aos quais aplica-se ‘expandir’.

Por exemplo, o código de campo [$Arquivo.$Sistema\texto.txt:expande], quando usado na importação de um arquivo, expande todos códigos de campo válidos encontrados no arquivo Texto.txt antes de exibi-lo.

Padrão

Converte a saída para pontuação numérica padrão (vírgula para símbolos decimais e símbolo de agrupamento sem dígitos; isto é, sem separador de milhares).

NOTA: Este modificador somente aplica-se para definições de relatórios. As rotinas de importação podem receber dados numéricos no formato padronizado (sem símbolo de agrupamento de dígito e vírgula decimal) ou valores que usam o símbolo de agrupamento de dígito e o símbolo decimal especificado no sistema do Microsoft Windows. As rotinas de exportação converte saídas numéricas para o formulário padronizado.

Reverso

Inverte o sentido dos códigos de campo apropriados. Por exemplo, [Azimute:Reverso] inverte o azimute que normalmente retornaria para uma linha determinada.

Quadrante

Mostra um azimute como um orientação quadrante. Por exemplo, um azimute de 228°37'25" aparece como N81°22'35"W.

Todo círculo

Exibe um azimute como uma orientação de todo círculo. Por exemplo, se o seu formato de azimute for configurado para orientação quadrante norte 81 graus 22 minutos e 35 segundos oeste, ele aparece como 228°37'25".

Verboso

Usa todas as palavras, onde apropriado. Por exemplo, se as unidades são abreviadas para ‘m’, use o modificador verboso para exibir a palavra ‘metros’.

Separar

Separa a seqüência no ponto decimal.

Por exemplo, o modificador [Elevação:separar] fornece a elevação sem ponto decimal.

NOTA: Este modificador é útil para a posição de anotação do ponto Ligado quando se cria modelos de anotação.

Este modificador substitui o ‘.’ por um só espaço, mas pode-se aumentar isso usando :separar<3>, por exemplo.

PartInt

Retira a parte fracionária do valor (até ‘.’).

PartFrac

Retira a parte integral do valor (de ‘.’).

Implicado

Controla a importação e importação de arquivos ASCII, onde o ponto decimal não está presente em valores numéricos, mas a sua posição está implicada. O modificador é usado em conjunto com a largura padrão de modificadores decimais.

Por exemplo, [Norte:10.3:Implicado] imitirá o valor Norte de 4853297.692 como 4853297692. A mesma definição de código de campo permite a interpretação correta de valores com pontos decimais implicados na importação.


Esboço do Formato

 Perspectiva geral e Mais informações

Esboços do formato lhe permitem construir códigos de campo.

Por exemplo, pode-se construir um código de campo para uma data usando componentes do esboço do formato:

[Data:<{DDDD}, {MMM} {D}-{YYYY}!>]

Isso dá em Domingo, Out 17 1999!

NOTA: Pode-se incluir qualquer texto do código de campo. No exemplo acima, uma marca de exclamação foi incluída.

Esboços de formato sempre encontram-se entre colchetes de setas (< >) (para esboços de formato completos) ou chaves ({ }) (para componentes de uma esboço de formato).

Esboços de formato somente aplicam-se à determinados tipos de dados. Eles são:

  Esboços de formato de data

  Esboços de formato de hora

  Esboços de formato de ângulos/orientações

Dates e horas fornecem componentes de um esboço de formato enquanto que ângulos/orientações fornecem esboços completos de formatos.


Esboço de Formato de Data

 Perspectiva geral e Mais informações

Os esboços de formato de data fornecem um controle da visualização do componente da data para um código de campo. Por exemplo, o código de campo da data que inclui o componente dd mostra a data com um zero inicial.

NOTA: Esboços amostra de formato de data que usam valores representativos, são disponíveis na opção formatos de atalho Campos / Avançado / Mais / Formato. Estes esboços amostra de data são convertidos automaticamente para usar os códigos de campo detalhado especificados aqui.

A lista completa de tipos disponíveis do esboço do formato da data é como no seguinte:


Esboços do Formato da hora

 Perspectiva geral e Mais informações

Os esboços do formato da hora fornecem um controle da visualização do componente da hora para um código de campo. Por exemplo, o código de campo da hora que inclui o componente hh para exibir a hora com um zero inicial (relógio de 12 horas).

NOTA: Esboços amostra de formato de hora que usam valores representativos, são disponíveis na opção Campos / Avançado / Mais / Esboços de formato. Estes esboços amostra de hora são convertidos automaticamente para usar os códigos de campo detalhado especificados aqui.

A lista completa de tipos disponíveis do esboço do formato da hora é como no seguinte:

NOTA: Os componentes da hora do dia do esboço do formato deve ser ordenado, com horas antes de segundos e milesegundos e no fim t ou tt. Pode-se omitir qualquer destes itens de formatação.

Tanto o componente data como a hora podem ser usados para os códigos de campo data e hora; a data passada possui todas as informações. Maiúscula ou minúscula nos componentes é importante para a distinção entre minutos (m) e meses (M).

Exemplos:

<DDDD, MMM D, YYYY!> fornece ‘Quinta, Out 14 1999!’  que é a data atual.

<hh mm sstt!> fornece ‘01 02 07pm!’  que é a hora atual.


Esboços do Formato Ângulos / Orientações

 Perspectiva geral e Mais informações

Os esboços do formato ângulos/orientações fornecem controle da visualização do componente ângulo/orientação para um código de campo. Por exemplo, o código de campo do azimute pode incluir o componente <dm.mm> para exibir o azimute em graus e minutos decimais.

NOTA: Os esboços do formato de ângulos/orientações são disponíveis no menu de atalho da opção Campos / Avançado / Mais / Esboços do formato.

Os tipos disponíveis de esboços de formato de ângulos/orientação são:

Segundos decimais

Exibe ângulos / orientações usando graus, minutos e segundos decimais (quando as unidades do ângulo são especificadas para graus). Este esboço de formato insere os caracteres de esboço <dms.ss>. Por exemplo, [Azimute:0.3:<dms.ss>] exibe um valor de azimute para três casas decimais de um segundo.

Minutos decimais

Exibe ângulos/orientações usando graus e minutos decimais (quando as unidades do ângulo são especificadas em graus). Este esboço de formato insere os caracteres de esboço <dm.mm>. Por exemplo, [Azimute:0.4:<dm.mm>] exibe um valor de azimute para quatro casas decimais de um minuto.

Graus decimais

Exibe ângulos / orientações usando graus decimais (quando as unidades de ângulo são configuradas para graus). Este esboço de formato insere os caracteres de esboço <d.dd>. Por exemplo, [Azimute:0.6:<d.dd>] exibe um valor de azimute para seis casas decimais de um grau.

Graus decimais assinados

Exibe ângulos / orientações usando graus decimais (quando as unidades de ângulo são especificadas para graus) e inclui um caractere inicial de sinal para o valor. Este esboço de formato insere os caracteres de formato <+d.dd>. Por exemplo, [Latitude<+d.dd>:0.8] exibe um valor de latitude para oito casas decimais de um grau, incluindo o caractere inicial de sinal (+ ou -) para o valor.


Substituição do Código do Campo

 Perspectiva geral e Mais informações

A substituição do código de campo reconhece algumas seqüências de caracteres de código especiais não de campo. Estes são como no seguinte:

Exemplos:

Para criar um formato de saída ASCII delimitado por guia, use os seguintes códigos de campo:

[Nome]\t[Leste]\t[Norte]\t[Elevação]\t[Código de característica]

Para anotar uma linha com azimute e distância em duas linhas, use os seguintes códigos de campo:

[Azimute]|[Distância]


Códigos de Campo e Importação de ASCII

 Perspectiva geral e Mais informações

Os códigos de campo permitidos num formato de importação são:

  Somente campos da tabela do ponto.

  Sem sub-registros e sem códigos de campo

(uma exceção é [$Sistema.Repetir<encontrar><sustituir>] que é permitido).

Alguns campos calculados são permitidos (por exemplo, Latitude/Longitude).

$Saltar

Existe um fim especial ($Saltar) para auxiliar na interpretação da entrada de ASCII:

Espaço

Este código de campo salta o número de espaços fornecidos pela largura ou, se uma largura não é fornecida, salta para um que não esteja em branco. Deve-se certificar-se de que colocou um espaço antes de Saltar para que o Trimble Geomatics Office saiba onde o campo anterior terminou. Por exemplo:

[Nome] [$Saltar.Espaço][Norte] [$Saltar espaço][Leste] [$Saltar espaço]

Número

Este código de campo salta um número (caracteres ‘+’, ‘-’, ’.’ & ‘0’...’9’). Se houver uma largura, salta tal número de caracteres apropriados; caso contrário, salta o primeiro caractere sem número.

NOTA: Isso não funciona com nulos ou exponenciais.

Linha

Este código de campo salta o número de linhas fornecidas na largura, ou uma linha.

Texto

Este código de campo salta o número fornecido de caracteres ou para um caractere não imprimível (por exemplo, ‘\n’).

Coluna

Este código de campo salta para o número fornecido da coluna.

Para:seqüência

Este código de campo salta para o primeiro caractere após a seqüência fornecida (por exemplo, [$Saltar.Para:ENTIDADES]).

NOTA: A seqüência não pode incluir linhas.

Existem algumas ‘funções de formato’ especiais:

Padrão

Esta função de formato converte a entrada da pontuação padrão: ‘.’ muda para o caractere de ponto decimal.

Saltar

Esta função de formato lê o campo como normal mas não armazena-o (por exemplo [Ponto.Prec Horz:10.3:saltar]).

= (Sinal de igual)

Esta função de formato designa o valor do campo usando o resto da seqüência do formato. Não procura no arquivo (por exemplo, [Código de característica:=importado]). Tais campos devem vir antes na seqüência do código do campo da definição (caso contrário, a análise torna-se confusa). Por exemplo ‘[Elevação:=0.0][Nome],[Norte],[Leste]’

NOTA: Quando se define um formato de importação ASCII, é importante especificar a largura num código de campo (por exemplo, [WGS Latitude:11]) ou especificar o caractere de separação enter códigos de campo (por exemplo, [WGS Latitude],[WGS Longitude],[WGS Altura] onde as vírgulas indicam o fim dos ‘campos’). Isso é porque, quando as rotinas de importação tentam interpretar valores de um arquivo ASCII, elas usam a definição de formato para encontrar a porção de cada linha de arquivo que deve ser lida num determinado campo do banco de dados. A largura ou caracteres separadores permitem a localização das porções apropriadas das linhas do arquivo.

NOTA: Para exibir horários de eventos para o milisegundo mais próximo, adicione o seguinte esboço de formato de hora no código de campo, <H:mm:ss.nnn>, onde nnn é o número de segundos decimais. Por exemplo, [Ponto Tempo Obs.:<H:mm:ss.nnn>]. Para aumentar a precisão do tempo, aumente o número de segundos decimais. Por exemplo, nnnn produz os primeiros 4 segundos decimais.


Diálogo Parâmetros do Código de Campo

Use este diálogo para completar o código de campo. O título do diálogo indica o contexto.

Nome

Esta coluna exibe os parâmetros a serem definidos.

Valor

Insira os valores requeridos.


Transferindo Arquivos para o Trimble Survey Controller - Perspectiva Geral

Mais informações

Como ...	Diálogo
Perspectiva geral

Pode-se transferir arquivos requeridos no campo para o Trimble Survey Controller. Para fazer isso, requer-se uma configuração do dispositivo Survey Controller na utilidade Transferência de dados.

Os seguintes tipos de arquivos podem ser transferidos:

  Arquivos de antena

  Arquivos do grid do datum (*.cdg)

  Arquivos do coletor de dados (*.dc)

  Arquivos do dicionário de dados (*.ddf)

  Pontos MTD

  Bibliotecas de Características e Atributos (*.fcl)

  Arquivos do grid do geóide (*.ggf)

  arquivos do Grid Nacional do Reino Unido (*.pgf)

  Arquivos CSV

  Arquivos do mapa de fundo


Opção Detalhes da antena para o Survey Controller

Se editou informações da antena no arquivo da antena, use esta opção para transferir esta informação para o Trimble Survey Controller.

  Para o Trimble Survey Controller versão 6.00 ou mais recente, os detalhes da antena são armazenados no arquivo Antena.ini.

  Para o Trimble Survey Controller versões 5.03 ou mais recentes, os detalhes da antena são armazenados no arquivo Antena.dat.

NOTA: Para exportar detalhes da antena, o arquivo de antena apropriado deve estar localizado na pasta Arquivos do Programa\Arquivos comuns\Trimble\Config.


Opção Arquivo do Survey Controller (*.dc)

Os arquivos Survey Controller (*.dc) fornecem uma ligação entre o Trimble Geomatics Office e o Trimble Survey Controller. Estes arquivos são criados quando se importa um trabalho do Trimble Survey Controller ou quando se exporta um projeto do Trimble Geomatics Office para este formato de arquivo.

Usando o Trimble Geomatics Office, pode-se:

  Importar um arquivo do Survey Controller (*.dc)

  Exportar um projeto do Trimble Geomatics Office para um arquivo do Survey Controller (*.dc) para ser posteriormente transferido para o Survey Controller

Para importar um arquivo Survey Controller (*.dc):

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivos do Survey Controller (*.dc). Aparece o diálogo Abrir.

4.	Selecione o arquivo de uma pasta que queira importar e clique Abrir.

Para exportar o projeto atual do Trimble Geomatics Office para um arquivo do Survey Controller (*.dc):

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção arquivos do Survey Controller (*.dc).

4.	Clique Opções para abrir o diálog Opções do Coletor de Dados e especificar o nome interno do arquivo e a versão do arquivo do Survey Controller.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK. Aparece o diálogo Salvar como.

7.	Selecione a pasta onde deseja salvar o arquivo.

8.	Por padrão, o nome do arquivo usa o nome do projeto. Insira um nome no campo Nome do arquivo para mudá-lo e clique Salvar.


Opção Survey Controller

Usando o Trimble Geomatics Office, pode-se transferir dados diretamente entre um projeto do Trimble Geomatics Office e o Trimble Survey Controller. Quando um trabalho é importado do Trimble Survey Controller, ele é convertido para um formato de arquivo Survey Controller (*.dc), que é usado pelo Trimble Geomatics Office.

Use o Trimble Geomatics Office para:

  Importar um trabalho do Trimble Survey Controller

  Exportar um projeto do Trimble Geomatics Office ao Trimble Survey Controller

Para acessar a opção, escolha uma das seguintes opções:

  Para importar um trabalho do Survey Controller para um projeto do Trimble Geomatics Office:

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Dispositivo de levantamento e clique OK. Aparece o diálogo Transferência de dados aberta.

Para exportar um projeto do Trimble Geomatics Office para o Survey Controller:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Dispositivo de levantamento.

4.	Clique Opções para abrir o diálogo Opções do Coletor de Dados para especificar o nome interno do arquivo e a versão do arquivo do Survey Controller.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK. Aparece o diálogo Salvar como.

7. 	Selecione um dispositivo do survey controller.

8.	Clique Abrir. O computador conecta ao Trimble Survey Controller.

9.	Selecione a opção Memória Principal ou Cartão de Dados de Levantamento (se disponível).

10.	Clique Abrir. O software lê a pasta selecionada e exibe todos os trabalhos do Trimble Survey Controller na pasta.

11.	No campo Nome do arquivo, insira um nome para o novo arquivo .dc.

12.	Clique Salvar para criar o arquivo .dc e transferi-lo ao Trimble Survey Controller.

NOTA: Se estiver transferindo dados para ou de uma versão 7.60 do Survey Controller, use o formato de arquivo .dc da versão 7.5.


Diálogo Opções do Coletor de Dados

Use este diálogo para especificar o tipo de coletor de dados para o qual se exportam dados.

Para acessá-lo:

1.	Selecione Arquivo / Exportar.

Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione uma das seguintes opções:

  Pontos MTD para arquivo

  Ponto MDT para o Survey Controller

  Biblioteca de Características e Atributos para o Survey Controller

  Arquivos SDR

  Survey Controller

 Arquivos do Survey Controller

4.	Clique Opções.

NOTA: Os campos disponíveis dependem da opção selecionada.

Versão

Selecione a versão relacionada ao formato de dados.

Nome do Trabalho / Arquivo

Exibe o nome do trabalho ou tipo de arquivo a ser exportado. Quando estiver exportando um trabalho, o nome do projeto do Trimble Geomatics Office é inserido por padrão. Use o teclado para inserir um novo nome para o arquivo.

Características e atributos de saída

Marque esta caixa de seleção para transferir a biblioteca de características e atributos usada para o projeto e todos informações de características e atributos designadas aos pontos do projeto que se está exportando. Esta opção somente é disponível para a versão 7.00 ou mais atual do Survey Controller.

Exportar linhas e arcos

Marque esta caixa de seleção para exportar linhas e arcos usados no projeto para o Trimble Survey Controller. Esta opção somente está disponível se linhas e arcos estiverem incluídos no grupo de seleção e somente for disponível para o Trimble Survey Controller 10.00 ou mais recente.

Saída como

Selecione a saída de pontos para o arquivo do coletor de dados.

A saída pode ser como posições WGS-84 ou de grid. Dependendo do formato de dados e versão selecionados e da definição do sistema de coordenadas do banco de dados, ambas opções nem sempre são disponíveis. Por exemplo, o Trimble Survey Controller de versão anterior à 4.00 somente aceita posições WGS-84; as versões Sokkia SDR20 somente aceitam posições de grid.

O sistema de coordenadas do projeto podem influenciar a saída de dados aos arquivos do Trimble Survey Controller. O Grid do datum (por exemplo, NAD83 HPGN e NADCON) e os métodos de transformação do datum de Regressão múltipla não são suportados pelas versões 6.50 ou mais antigas do Trimble Survey Controller. A versão 7.00 do Trimble Survey Controller suporta grids do datum.

Se dados forem exportados para o Trimble Survey Controller que não suporta o método de transformação do datum especificado no projeto, o registro do Datum do arquivo .dc criado tem o método do datum configurado para Nenhum. As posições de grid incorretas não podem ser exibidas no Trimble Survey Controller. Para maiores informações, consulte o tópico Métodos da trnsformação do datum e o Trimble Survey Controller.

Similarmente, a versão 4.00 do Trimble Survey Controller não pode trabalhar com modelos do geóide. Se um projeto usar um modelo do geóide, o método do datum também é configurado para Nenhum. Isso garante que a versão 4.00 do Trimble Survey Controller não pode exibir dados incorretamente.

Para usar dados de coordenada do grid transferidos no campo, deve-se efetuar uma calibração no campo para relacionar os dados do grid aos dados GPS observados. Para maiores informações, consulte o tópico Modelos geóide e Survey Controllers.

Detalhes do arquivo

Marque a caixa de seleção Anexar arquivo para incluir dados de um arquivo .dc existente na exportação. O botão Procurar torna-se disponível. Clique Procurar para localizar o arquivo .dc que deseja incluir no novo arquivo. Os dados do projeto atual é então anexado ao novo arquivo.

Esta opção é útil se contar com um arquivo .dc que contenha pontos de controle que deseja adicionar aos dados a serem exportados. Isso preserva o arquivo .dc no seu estado original.


Unidades do Coletor de Dados

Quando um arquivo do Trimble Survey Controller (.dc) ou um arquivo do formato SDR é importado, a definição das unidades do cabeçalho do arquivo é usado para fins de conversão da unidade. O Trimble Geomatics Office sempre funciona com dados SI internos (métricos) de modo que os dados importados de um arquivo de dispositivo é convertido devidamente.

Para selecionar como os valores devem ser exibidos na tela:

1.	Selecione Arquivo / Propriedades do projeto.

Aparece o diálogo Propriedades do projeto.

2.	Selecione a guia Unidades e Formato.

Use esta guia para selecionar as unidades de visualização.

NOTA: Arquivos SDR somente contam com configurações de unidades de distância em pés e metros. Para o arquivos SDR, valores de pés são interpretados como valores de pés de levantamento americanos, se as unidades da Coordenada forem configurados para pés de levantamento americanos.


Opção Notas de atributo do arquivo DC (Survey Controller V4)

Arquivos de notas de atributos são arquivos simples, delimitados por vírgula. Eles incluem atributos de pontos coletados como notas de atributo num dispositivo que execute o Trimble Survey Controller (versão 3 ou 4). Esta opção não exporta atributos coletados com o uso de uma biblioteca de características e atributos (disponível com a versão 7.00 ou mais atual do Trimble Survey Controller).

Use esta opção para exportar somente atributos coletados que utilizam registros de notas.

O processo é:

1.	Importar um arquivo da versão 3 ou 4 do Trimble Survey Controller que contenha notas de atributo para o projeto do Trimble Geomatics Office.

Um grupo de seleção é criado pelo Trimble Geomatics Office. Este grupo de seleção recebe o mesmo nome do trabalho interno do arquivo.

2.	Selecionar o grupo de seleção criado. O grupo de seleção é usado para leitura de pontos do projeto para o arquivo de atributo.

3.	Exportar o arquivo .dc com notas de atributos.

Um exemplo do tipo de arquivo produzido é:

1000,5315.362,1056.274,82.361,ÁRVORE,TIPO,PINUS,ALTURA,25,DIÂMETRO,0.5

1001,5382.728,1132.692,75.472,ÁRVORE,TIPO,BÉTULA,ALTURA,20,DIÂMETRO,0.4

1002,5298.048,1162.472,55.927,PP,VOLTAGEM,110KV,CABOS,3

1003,5308.682,1192.329,62.854,PP,VOLTAGEM,110KV,CABOS,3


Opção Pontos MTD ao Survey Controller

Use esta opção para exportar pontos MTD a um dispositivo que esteja executando o Trimble Survey Controller.

Para fazê-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Pontos MTD ao Survey Controller.

4.	Clique Opções para especificar o nome do arquivo e a versão do Survey Controller para qual está exportando.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK. Aparece o diálogo Transferência de dados Salvar como.

Os pontos selecionados para a exportação devem ser pontos regularmente quadriculados. Isto é, eles devem formar um quadriculado de pontos, orientados Norte-Sul e Leste-Oeste, com espaço igual entre os pontos em qualquer direção. Tipicamente, os pontos quadriculados são importados para o sistema de um arquivo ASCII de coordenadas. Certifique-se de que somente pontos regularmente quadriculados são selecionados para a exportação, e que nenhum ponto extra fora do quadriculado seja incluído na seleção atual.

Uma vez que a opção de exportação tenha sido selecionada, o sistema da Trimble Geomatics Office classifica os pontos quadriculados selecionados na ordem apropriada e cria um arquivo especialmente formatado que é requerido pelo Trimble Survey Controller.


Opção Pontos MTD para arquivo (*.dtx)

Use esta opção para exportar pontos MTD para um arquivo do Modelo de Terreno Digital (*.dtx).

Para fazê-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Pontos MTD para arquivo (*.dtx).

4.	Clique Opções para especificar o nome do arquivo e a versão do Survey Controller para o qual está exportando.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK. Aparece o diálogo Salvar como.

7.	Insira o nome do arquivo e selecione a pasta na qual deseja que ele seja salvado.

8.	Clique OK.

Os pontos selecionados para a exportação devem ser pontos regularmente quadriculados. Isto é, eles devem formar um quadriculado de pontos, orientados Norte-Sul e Leste-Oeste, com espaços iguais. Tipicamente, os pontos quadriculados são importados para o sistema de um arquivo ASCII de coordenadas. Certifique-se de que somente pontos regularmente quadriculados são selecionados para a exportação, e que nenhum ponto extra fora do quadriculado seja incluído na seleção atual.

Uma vez que a opção de exportação tenha sido selecionada, o sistema da Trimble Geomatics Office classifica os pontos quadriculados selecionados na ordem apropriada e cria o arquivo no formato do Modelo Digital do Terreno (*.dtx).


Opção Grid do Datum para o Survey Controller (*.cdg)

Mais informações

Como ...	Ver também

Use esta opção para criar arquivos de grid do datum combinados para transferir para o Trimble Survey Controller.

Para fazê-lo:

1.	 Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Grid do Datum para o Survey Controller (*.cdg).

Aparece o diálogo Exportar um Grid do Datum.

Arquivos do Grid do Datum armazenam transformações do grid do datum para a área definida. Com o uso da utilidade Coordinate System Manager da Trimble, pode-se definir um sistema de coordenadas que usa um arquivo de grid do datum como a transformação do datum do sistema (por exemplo, NADCON). Pode-se então selecionar um sistema de coordenadas que usa um grid do datum para o projeto Trimble Geomatics Office. Para usar o arquivo do grid do datum no campo, deve-se transferir o arquivo do grid do datum como um arquivo do grid do datum combinado para o Trimble Survey Controller (versão 7.00 ou mais recente). Para informações sobre os métodos de transformações do datum disponíveis para diferentes versões do Trimble Survey Controller, consulte o tópico Transformações do Datum e Survey Controllers.

Existe um arquivo de grid da longitude e latitude na pasta Arquivos do Programa\Arquivos Comuns\Trimble\Geodata para o grid do datum selecionado. Estes arquivos devem ser combinados antes de serem exportados para o Trimble Survey Controller. Ao escolher a opção Criar um arquivo Grid do Datum Combinado para exportar para o Survey Controller, o combina os arquivos associados com o grid do datum especificado no sistema de coordenadas do projeto.

Ao criar um arquivo do grid do datum combinado e usá-lo com o Trimble Survey Controller, o nome do grid do datum original é armazenado no arquivo .dc, por exemplo NADCON (HPGN).

Se importar o arquivo .dc para o Trimble Geomatics Office, ele usa este nome para determinar se o sistema de coordenadas usado no campo combina com o sistema de coordenadas definido para o projeto do Trimble Geomatics Office.

NOTA: Somente pode-se criar um arquivo de grid do datum combinado do arquivo do grid do datum atualmente usado, mas pode-se exportar qualquer grid do datum combinado.

Pode-se:

  transferir um arquivo do grid do datum combinado (.cdg) existente.

  criar um novo arquivo do grid do datum combinado (.cdg) para exportar ao Trimble Survey Controller.

NOTA: Também pode-se usar a utilidade Grid Factory™ da Trimble para combinar arquivos de grid do datum. Para instalar a utilidade Grid Factory, use a opção de instalação personalizada do Trimble Geomatics Office.


Transformações do Datum e Trimble Survey Controllers

O Trimble Geomatics Office suporta o uso de definições de Grids do Datum e Regressão Múltipla para transformações do datum.

Ums série de definições do sistema de coordenadas que usam estes métodos de transformação do datum são fornecidos no banco de dados do sistema de coordenadas fornecidos com o software.

Versões anteriores à 7.00 do Trimble Survey Controller não suportam nenhum destes tipos de transformação do datum. A versão 7.00 do Trimble Survey Controller suporta os grids do datum.

O Trimble Geomatics Office não pode criar:

  um arquivo .dc da versão 6.50 ou anterior do Trimble Survey Controller que referencie qualquer um destes métodos de transformação do datum.

  um arquivo .dc da versão 7.00 do Trimble Survey Controller que referencie uma transformação do datum de regressão múltipla.

Quando pontos de um projeto que usa um método não suportado são exportados para um arquivo .dc do Trimble Survey Controller, o Trimble Geomatics Office produz o registro do datum com o grupo do método para Nenhum.

Isto significa que no Trimble Survey Controller não é possível mudar a visualização do ponto entre posições WGS-84 e de grid. Também significa que no trabalho de campo requer-se efetuar uma calibração se tiver transferido posições de grid antes que qualquer ulterior trabalho de campo possa ser efetuado usando estes pontos.

Se as posições de grid foram transferidas para fins de calibração, esse não será o caso. Se posições WGS-84 são transferidas, pode-se iniciar a definição imediatamente. No entanto, não é possível visualizar coordenadas de grid, a não ser que seja efetuada uma calibração no campo.


Diálogo Exportar um Grid do Datum

Use esta opção para exportar um arquivo do Grid do Datum (*.cdg).

Para acessá-la:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Grid do Datum para o Survey Controller (*.cdg).

4.	Clique OK.

Ao selecionar a opção Grid do Datum para o Survey Controller (*.cdg), aparece o diálogo Exportar um Grid do Datum.

Exportar arquivo existente Grid do Datum Combinado para o Survey Controller

Selecione esta opção para exportar um arquivo do grid do datum combinado para o Trimble Survey Controller (versão 7.00 ou mais recente). Pode-se optar por exportar quaisquer dos arquivos do Grid do Datum Combinado que existe na pasta GeoData. Se selecionar esta opção, aparece o diálogo Selecionar.

Criar um Grid do Datum Combinado para exportar para o Survey Controller

Selecione esta opção para criar um novo grid do datum combinado usando o arquivo do grid do datum usado pelo sistema de coordenadas do projeto atual. Aparece o diálogo Criar um arquivo do Grid do Datum Combinado.


Diálogo Salvar como (Exportar Grid do Datum / Grid do Geóide)

Use este diálogo para inserir um nome para o arquivo Grid do Datum Combinado (*.cdg) ou Grid do Geóide (*.ggf).

Clique OK para abrir o diálogo Transferência de dados Salvar como.


Diálogo Criar um arquivo Grid do Datum Combinado

Use este diálogo para definir a área na qual quer criar um arquivo Grid do Datum Combinado (*.cdg). Pode-se então enviar o arquivo grid do datum combinado para o Trimble Survey Controller para usar no campo.

Para criar um arquivo .cdg, o sistema de coordenadas para o projeto deve usar um grid do datum para o seu sistema de coordenadas. Para informações sobre o uso de arquivos do grid do datum, consulte a ajuda on-line da utilidade Coordinate System Manager™ da Trimble.

Para acessá-la:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Grid do Datum para o Survey Controller.

4.	Clique OK. Aparece o diálogo Exportar um Grid do Datum.

5.	Selecione a opção Criar um Grid do Datum Combinado para exportar para o Survey Controller.

6.	Clique OK.

A caixa amarela do globo define a área coberta pelos arquivos de grid da datum de latitude e longitude.

Use as ferramentas para arrastar a caixa sobre uma área do globo dentro do grid do datum que o grid do datum combinado deve cobrir.

Propriedades do arquivo

O grupo Propriedades do arquivo mostra os arquivos que são usados para criar o arquivo .cdg.

Grid do Datum

Exibe o arquivo do grid do datum usado para criar o arquivo .cdg.

Arquivo do Grid da Latitude

Exibe o arquivo do grid da latitude que está sendo usado para criar o arquivo .cdg.

Arquivo do Grid da Longitude

Exibe o arquivo do grid da longitude que está sendo usado para criar o arquivo .cdg.

Propriedades do Grid

O grupo Propriedades do Grid exibe as propriedades do grid que se está definindo.

Limites da latitude

Exibe os limites da latitude da caixa atual.

Limites da longitude

Exibe os limites da longitude da caixa atual.

Tamanho do Arquivo

Exibe o tamanho do arquivo .cdg criado. O valor do Tamanho do Arquivo muda na medida que se muda a forma da caixa no globo.

Nome do Survey Controller

Exibe o nome interno do arquivo .cdg que será usado no Trimble Survey Controller. O campo Nome do Survey Controller tem por padrão o nome do grid do datum original. Se o arquivo .cdg é usado num trabalho do Trimble Survey Controller, o nome interno é referenciado. Durante a importação do arquivo Coletor de Dados (*.dc), o Trimble Geomatics Office usa o nome interno para determinar se o grid do datum combinado usado no arquivo .dc combina com o grid do datum para o projeto Trimble Geomatics Office.

NOTA: Se este campo for editado, certifique-se de somente adicionar um sufixo ou prefixo ao nome. Isso garante que o nome será único e ainda assim permite que o grid do datum original seja reconhecido na importação. Não é possível continuar enquanto o campo Nome do Survey Controller não contenha o nome do grid do datum.

Propriedades do Globo

O grupo Propriedades do Globo mostra a posição do cursor e fornece opções para configurar a aparência do globo.

Posição do Cursor

Exibe a atual posição da latitude e longitude do ponteiro do mouse no globo.

Apresenta os limites estaduais

Marque esta caixa de seleção para exibir limites estaduais no globo.

Apresenta limites nacionais

Marque esta caixa de seleção para exibir limites nacionais no globo.

Apresentar rios

Marque esta caixa de seleção para exibir rios no globo.


Opção Arquivo geóide para Survey Controller (*.ggf)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva geral

Arquivos de Grid do Geóide (*.ggf) armazenam a separação entre o elipsóide WGS-84 e o geóide para a área definida. Para informações sobre os modelos do geóide, consulte o tópico Modelos Geóide – Perspectiva Geral.

Se um arquivo .ggf for usado como parte do sistema de coordenadas para um projeto do Trimble Geomatics Office, elevações aproximadas para os pontos GPS são calculadas para pontos GPS. Para usar um arquivo .ggf no campo, use o Trimble Geomatics Office para transferir o arquivo .ggf ao Trimble Survey Controller (versão 6.00 ou mais recente).

Para fazê-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivos geóide para Survey Controller.

Aparece o diálogo Exportar um Modelo Geóide.

Com esta opção, pode-se escolher:

  Transferir qualquer arquivo .ggf da pasta Arquivos do programa \ Arquivos comuns \ Trimble \ GeoData.

  Subdividir o grid do arquivo .ggf usado no projeto atual do Trimble Geomatics Office para extrair um arquivo menor do grid do geóide. Este processo reduz o tamanho do arquivo .ggf que se envia para o dispositivo TSC1 que executa o Trimble Survey Controller (versão 6.00 ou mais atual).

Para informações sobre o suporte do modelo geóide para diferentes versões do Trimble Survey Controller, consulte o tópico Modelos Geóide e Survey Controllers.

Ao criar um novo arquivo .ggf através da subdivisão do grid, o nome do modelo geóide original é armazenado (por exemplo, GEOID96 Conus). Este nome interno também é incluído nos arquivos .dc que usam o arquivo .ggf com grid subdivididos. Durante a importação de um arquivo .dc, o Trimble Geomatics Office usa este nome para determinar se o modelo geóide usado no campo combina com o modelo geóide definido para o projeto do Trimble Geomatics Office.

NOTA: Também pode-se usar a utilidade Grid Factory da Trimble para subdividir o grid dos arquivos do modelo geóide. A utilidade Grid Factory é parte da opção Personalizar na instalação do Trimble Geomatics Office.


Opção Arquivo geóide para TDS Survey Pro CE (*.ggf)

Mais informações

Como ...	Diálogo	Ver também
Perspectiva Geral

Arquivos de grid do geóide (*.ggf) armazenam a separação entre o elipsóide WGS-84 e o geóide para a área definida. Para informações sobre os modelos de geóide, consulte o tópico Modelos geóide − Perspectiva geral.

Se um arquivo .ggf for usado como parte do sistema de coordenadas para um projeto do Trimble Geomatics Office, elevações aproximadas para pontos GPS são calculados. Para usar um arquivo .ggf no campo, use o Trimble Geomatics Office para transferir o arquivo .ggf para o TDS Survey Pro CE 3.5 ou mais recente.

Para fazê-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivos Geóide para o  TDS Survey Pro CE.

Aparece o diálogo Exportar um Modelo Geóide.

Com esta opção, pode-se selecionar para:

  Transferir todo arquivo .ggf em Arquivos do programa\Arquivos comuns\Trimble\pasta GeoData.

  Sub-divida o grid do arquivo .ggf usado no atual projeto do Trimble Geomatics Office para extrair um arquivo menor de Grid do Geóide. Este processo reduz o tamanho do arquivo .ggf que você envia para o dispositivo TSCE que executa o TDS Survey Pro CE 3.5 ou mais recente.

NOTE: You can also use the Grid Factory utility to sub-grid geoid model files. The Grid Factory utility is part of the Custom option at installation of Trimble Geomatics Office.


Modelos Geóide e o Trimble Survey Controller

Modelos geóide podem ser transferidos para a versão 6.00 ou mais recente do Trimble Survey Controller. O Trimble Survey Controller usa estes modelos de geóide quando muda a visualização de pontos entre as posições WGS-84 e posições de grid (NLL).

Geralmente, modelos Geóide são arquivos muito grandes. Geralmente não é possível carregar um modelo geóide completo na versão 6.00 (ou mais recente) do Trimble Survey Controller.

Use Arquivo / Exportar / opção Arquivos geóide para Survey Controller para criar um modelo geóide mais pequeno para a sua área. Pode-se então transferir este arquivo mais pequeno para o Trimble Survey Controller.

Versões mais antigas do Trimble Survey Controller

Os seguintes pontos referem-se à versões mais antigas do Trimble Survey Controller.

Versão 5.00

Esta é uma versão Militar e não está disponível para o uso geral.

Versão 4.00

Esta versão não podem trabalhar com modelos geóide. Se o Trimble Geomatics Office tivesse que escrever uma definição completa do sistema de coordenadas seguida das posições do ponto como posições do Grid ou WGS-84 para um arquivo .dc da versão 4 do Trimble Survey Controller, alturas e elevações incorretas podem ser visualizadas no Trimble Survey Controller.

Isso ocorreria dentro do Trimble Survey Controller se a exibição de dados fosse trocada, com alturas incorretas de WGS-84 sendo exibidas quando as posições de grid tenham sido transferidas e elevações incorretas do ponto do grid exibidas quando posições WGS-84 tenham sido transferidas.

Para evitar que isso aconteça, o Trimble Geomatics Office produz o registro do datum da definição do projeto e depois lhe avisa que não é possível converter entre valores NLL e WGS-84, devido a um modelo geóide e avisa-o de que uma transformação em branco foi adicionada. Isso é permitido por outro registro de datum registrado com o método configurado para Nenhum. Um registro de datum mais atual sempre sobrescreve todos registros de datums mais antigos. Isso significa que na versão 4 do Trimble Survey Controller não é possível mudar entre as posições WGS-84 e grid. Isso evita a visualização de quaisquer valores errôneos.

Para o trabalho de campo, isso significa que, se posições de grid forem carregadas, deve-se efetuar uma calibração. Deve-se fazer isso antes de efetuar qualquer trabalho de campo usando estes pontos (se as posições do grid foram transferidas para fins de calibração, isso não é um problema).

NOTA: Se as posições WGS-84 são transferidas, pode-se definir imediatamente. No entanto, não é possível visualizar coordenadas do grid, a não ser que seja efetuada uma calibração no campo.

Versões anteriores à Versão 4.00

Versões mais antigas do Trimble Survey Controller somente podem manipular o carregamento de posições WGS-84 e, por causa disso, não são afetadas pelo uso de um modelo geóide num projeto.


Diálogo Exportar um Modelo Geóide

Ao selecionar a opção Arquivos geóide para Survey Controller (*.ggf), ou a opção arquivos Geóide para TDS Survey Pro CE (*.ggf), aparece o diálogo Exportar um Modelo Geóide.

Exportar modelo existente de Geóide para o Survey Controller

Selecione esta opção para exportar um arquivo do grid do geóide para o Trimble Survey Controller (versão 6.00 ou mais recente) ou o TDS Survey Pro CE (versão 4 ou mais recente). Pode-se exportar qualquer dos arquivos do grid do geóide que existem na pasta do GeoData. Se selecionar esta opção, aparece o diálogo Selecionar.

Criar um sub-grid de um modelo Geóide para exportar para o Survey Controller

Selecione esta opção para subdividir o grid do geóide usado no sistema de coordenadas do sistema atual. Aparece o diálogo Criar Arquivo do Grid do Geóide.


Diálogo Criar Arquivo do Grid do Geóide

Use este diálogo para definir a área para a qual deseja criar um novo arquivo do grid do geóide que seja baseado no arquivo do grid do geóide usado no sistema de coordenada do projeto.

Para acessá-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivos geóide para Survey Controller (*.ggf) ou a opção Arquivos geóide para TDS Survey Pro CE (*.ggf).

4.	Clique OK. Aparece o diálogo Exportar um Modelo Geóide.

5.	Selecione a opção Criar um sub-grid de um modelo Geóide para exportar.

6.	Clique OK.

A caixa amarela do globo define a área coberta pelo modelo geóide.

Use as ferramentas para arrastar a caixa sobre uma área do globo dentro do modelo geóide que o grid deve cobrir. O tamanho do arquivo da caixa atual é exibido.

Propriedades do Arquivo

O grupo Propriedades do Arquivo exibe as propriedades do arquivo do grid do geóide que é usado para criar o arquivo .ggf.

Geóide

Exibe o modelo geóide que é usado no sistema de coordenadas do projeto.

Arquivo do Grid do Geóide

Exibe o nome do arquivo do grid do geóide que é usado no modelo do geóide.

Propriedades do Grid

O grupo Propriedades do Grid exibe as propriedades do grid que se está definindo.

Limites da latitude

Exibe os limites da latitude da caixa atual.

Limites da longitude

Exibe os limites da longitude da caixa atual.

Tamanho do Arquivo

Exibe o tamanho do arquivo do grid do geóide que será criado. O valor do Tamanho do Arquivo muda na medida que se muda a forma da caixa no globo.

Nome

Exibe o nome interno do arquivo sub-grid que será usado no Trimble Survey Controller ou software TDS Survey Pro CE. O campo Nome do Survey Controller tem por padrão o nome do modelo geóide original. Se o arquivo .ggf é usado num trabalho do Trimble Survey Controller, o nome interno é referenciado. Durante a importação do arquivo Coletor de Dados (*.dc), o Trimble Geomatics Office usa o nome interno para determinar se o modelo do geóide usado no arquivo .dc combina com o modelo geóide definido para o projeto Trimble Geomatics Office.

NOTA: Se este campo for editado, certifique-se de somente adicionar um sufixo ou prefixo ao nome. Isso garante que o nome será único e ainda assim permite que o modelo geóide original seja reconhecido na importação. Não é possível continuar enquanto o campo Nome do Survey Controller não contenha o nome do modelo do geóide.

Propriedades do Globo

O grupo Propriedades do Globo mostra a posição do cursor e fornece opções para configurar a aparência do globo.

Posição do Cursor

Exibe a atual posição da latitude e longitude do ponteiro do mouse no globo.

Apresenta os limites estaduais

Marque esta caixa de seleção para exibir limites estaduais no globo.

Apresenta limites nacionais

Marque esta caixa de seleção para exibir limites nacionais no globo.

Apresentar rios

Marque esta caixa de seleção para exibir rios no globo.

NOTE: Pode-se também usar a utilidade Grid Factory da Trimble para subdividir o grid dos arquivos do modelo geóide. A utilidade Grid Factory é parte da opção Personalizar na instalação do Trimble Geomatics Office.


Opção Biblioteca de Características e Atributos para o Survey Controller (*.fcl)

 Perspectiva geral e Mais informações

Para exportar um biblioteca de características e atributos para o Trimble Survey Controller:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione guia Levantamento.

3.	Selecione a opção Biblioteca de Características e Atributos para o Survey Controller (*.fcl).

Aparece o diálogo Selecionar Biblioteca de Características e Atributos.

Use esta opção para exportar um biblioteca de características e atributos para o Trimble Survey Controller para que possa coletar códigos de característica no campo. Pode-se também usar a biblioteca de características e atributos para coletar atributos para códigos de característica com atributos definidos.


Diálogo Selecionar Biblioteca de Características e Atributos

Use este diálogo para selecionar a biblioteca de características e atributos que deseja transferir para o dispositivo de levantamento.

Procurar

Clique Procurar para selecionar uma biblioteca.

Arquivo

O padrão do campo arquivo é o nome do último arquivo exportado.

Atributos da Exportação

Somente pode-se fazer isso quando se exporta para a versão 7.00 ou mais recente do Trimble Survey Controller. Marque esta caixa de seleção para exportar definições de atributos exportadas contidas na biblioteca de características e atributos.

Use esta opção se desejar coletar informações de atributos no campo. Se esta caixa de seleção for desmarcada, todos atributos definidos no arquivo da biblioteca não são exportados.

Este campo não é disponível quando se exporta para o software TDS Survey Pro CE ou Trimble 3600/5600 TDS.

OK

Clique OK logo que tiver escolhido a biblioteca apropriada de características e atributos.

Aparece o diálogo Transferência de dados e Salvar como.

NOTA: Códigos de controle também são exportados para o Trimble Survey Controller.


Diálogo Opções da Biblioteca de Características e Atributos

Use este diálogo para configurar a versão do Trimble Survey Controller para o qual se está exportando.

Para acessá-lo:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Biblioteca de Características e Atributos para o Survey Controller.

4.	Clique Opções.

Versão

Se selecionar uma versão do Trimble Survey Controller anterior à versão 7.00, a caixa de verificação exportar atributos do diálogo Selecionar Biblioteca de características e atributos não será disponível. Isso porque estas versões não suportam atributos.


Opção Dicionário de Dados para Survey Controller (*.ddf)

 Perspectiva geral e Mais informações

Use esta opção para exportar um arquivo do dicionário de dados para a versão 7.00 ou mais recente do Trimble Survey Controller. No Trimble Survey Controller, use o arquivo do dicionário de dados para coletar atributos.

Para exportar um arquivo do dicionário de dados para o Trimble Survey Controller:

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivo do Dicionário de Dados para Survey Controller (*.ddf).

4.	Clique OK.

Aparece o diálogo Selecionar.


Diálogo Selecionar (Exportar arquivos do Dicionário de dados para o Trimble Survey Controller)

Use este diálogo para selecionar o arquivo de Dicionário de dados (*.ddf) que quer transferir para o Trimble Survey Controller.

Ao clicar Abrir, aparece o diálogo Transferência de dados Salvar como.


Transferência de dados do Trimble Survey Controller - Perspectiva geral

 Como ...

Perspectiva geral

Pode-se conectar a um dispositivo que execute o Trimble Survey Controller e transferir trabalhos para o Trimble Geomatics Office. Durante a importação, os trabalhos são convertidos para os arquivos do Coletor de dados (*.dc). Para fazê-lo, deve-se salvar uma configuração de dispositivo do survey controller na utilidade Data Transfer da Trimble.

NOTA: Se qualquer trabalho contar com arquivos de dados GPS não processados da Trimble (*.dat) associado a ele, os arquivos .dat são importados com o trabalho. Se importar um arquivo .dat mais de uma vez para o mesmo projeto, ocupações existentes no projeto não são selecionadas por padrão no diálogo DAT Checkin.

Durante a importação de um arquivo .dc, o Trimble Geomatics Office usa a classe designada para cada ponto do Trimble Survey Controller e o método usado para determinar a posição do ponto para designar uma qualidade para o ponto. A função Re-computar usa a qualidade para determinar a posição calculada para o ponto.

NOTA: Se estiver transferindo dados para ou de uma versão 7.60 do Survey Controller, use o formato de arquivo .dc da versão 7.5.

NOTA: Se desejar efetuar um ajuste de rede usando dados baixados de um Trimble Survey Controller, certifique-se de inserir uma pressão, temperatura e correção de curvatura e refração no esttilo do Survey Controller quando estiver efetuando o levantamento.


Registros da nota - Perspectiva geral

Notas no projeto são notas inseridas pelo usuário do Trimble Survey Controller. Nenhuma nota de informação de levantamento, tais como “Inicialização obtida’ e ‘Inicialização perdida’, são colocadas no projeto.

Registros de nota são usados em versões mais antigas do Trimble Survey Controller para os seguintes fins:

Se estiver usando versões mais antigas do Trimble Survey Controller e desejar usar registros de notas, escolha o diálogo Selecionar / Por tipos para selecionar todos regstros de notas do projeto.


Arquivos do coletor de dados Sokkia (*.sdr)

O Trimble Geomatics Office suporta dados de um formato de arquivo do coletor de dados Sokkia (*.sdr).

Usando o Trimble Geomatics Office, pode-se:

  Importar um arquivo do coletor de dados Sokkia (*.sdr) para um projeto do Trimble Geomatics Office.

  Exportar um arquivo do projeto do Trimble Geomatics Office para um arquivo do coletor de dados Sokkia (*.sdr).

Para importar um arquivo do coletor de dados Sokkia (*.sdr):

1.	Selecione Arquivo / Importar. Aparece o diálogo Importar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção arquivos (*.sdr)do coletor de dados Sokkia (*.sdr). Aparece o diálogo Abrir.

4.	Selecione o arquivo de uma pasta de onde queira importar e clique Abrir.

Para exportar o atual projeto do Trimble Geomatics Office para um arquivo do coletor de dados Sokkia (*.sdr):

1.	Selecione Arquivo / Exportar. Aparece o diálogo Exportar.

2.	Selecione a guia Levantamento.

3.	Selecione a opção Arquivos SDR (*.sdr).

4.	Clique Opções para abrir o diálogo opções do Coletor de dados para especificar o nome interno do arquivo e a versão do Arquivo do coletor de dados Sokkia.

5.	Clique OK para aceitar as configurações e voltar ao diálogo Exportar.

6.	Clique OK. Aparece o diálogo Salvar como dialog

7. Selecione a pasta para a qual deseja exportar o arquivo, insira um nome de arquivo e clique Salvar.


Transferindo Arquivos do grid nacional da Grã-Bretanha para o Trimble Survey Controller

Como ...

Use a utilidade Data Transfer da Trimble para transferir arquivos do grid nacional da Grã-Bretanha (*.pgf) diretamente para uma versão 7.5 ou mais recente do Trimble Survey Controller.

Pode-se transferir qualquer arquivo .pgf existente localizado na pasta Arquivos do programa\Arquivos comuns\Trimble\Geodata.

NOTA: Esta opção de exportação somente é disponível quando a utilidade Data Transfer da Trimble é executada autonomamente. Esta opção não está disponível no diálogo Exportar do Trimble Geomatics Office.


Preenchimento do Campo - Perspectiva Geral

Mais Informações

 Como ...

Perspectiva Geral

Use preenchimento de campo para inserir valores nos campos. Por exemplo, pode-se preencher um campo de camada, clicando um ponto que está na camada que deseja.

Em campos que suportam preenchimentos, o ponteiro na janela de gráficos mostra:

NOTA: Se a entidade selecionada na janela de gráficos não pode fornecer o valor requerido pelo campo realçado, o campo do diálogo permanece não afetado.

Alguns campos são preenchidos como um grupo de valores. Um só clique preenche todos os campos agrupados. Por exemplo, os campos Norte, Leste e Elevação geralmente formam um grupo. Para preencher somente um campo, selecione-o, mantenha apertado Alt e clique.

O foco do Trimble Geomatics Office move para o próximo campo vazio após o preenchimento de campo.

Usos especiais do preenchimento de campo

Preenchimento de campo possui os seguintes usos especiais:

  Para inserir o valor de azimute oposto quando se preenche um campo de azimute, mantenha apertado Shift e clique. Não pode-se usar preenchimento de campo para o campo do azimute quando se adicionam pontos por azimute e distância.

  Mantendo Ctrl apertado enquanto se está preenchendo campos evita saltos para entidades—somente coordenadas são escolhidas. Isso lhe permite selecionar coordenadas próximas de uma entidade.

  Use os comandos de menu de Visualização (por exemplo Zoom e Pan) para localizar as entidades com os valores requeridos para o preenchimento de campo. Uma vez localizadas, deve-se voltar o foco para o campo antes de copiar o valor.


Inserindo Ângulos

Os dígitos do lado direito do ponto decimal são interpretados de acordo com as configurações do ângulo, unidade e formato.

Para configurar o formato, use a guia Unidades e Formatos no diálogo Propriedades do projeto.

Por exemplo:

Inserindo os dígitos 10.1234


Conversões da Unidade

Para configurar as unidades da apresentação para campos que possuem unidades (tais como, apresentação na tela, importação, exportação e informes), use a guia Unidades e Formato no diálogo Propriedades do projeto.

Todo valor numérico inserido num campo é interpretado como unidades do valor configurado para o sistema. Por exemplo, com os ajustes para elevação configurados para metros, todos valores numéricos inseridos num campo de elevação serão interpretados como valores métricos.

Pode-se sobrescrever esta configuração digitando o valor numérico seguido por uma entrada numérica.

O sistema lhe deixa inserir outros valores com a especificação de uma unidade. Por exemplo, se você inserir uma elevação como ‘25 sft’, o Trimble Geomatics Office reconhece a unidade (como pés US Survey) e interpreta o valor devidamente.

A seguinte tabela fornece uma visão geral dos valores aplicados a esta característica:


Arrastando Entidades

Para mover ou girar uma entidade selecionada com o mouse, use os manipuladores de edição.

Por exemplo, pode-se mudar a posição de uma anotação para apresentar melhor as informações que ela contém e melhorar o leiaute de uma janela principal de gráficos.

Texto/Anotações

Para arrastar entidades de texto ou anotações, selecione o texto, anotações ou ambos, mova o ponteiro do mouse sobre o quadro do texto e coloque um dos dois manipuladores. O ponteiro do mouse muda para um ícone apropriado quando se coloca o ponteiro sobre o indicador. O ponteiro para arrastar lhe permite mover a identidade. O ponteiro para girar lhe permite girar a entidade.

Por exemplo:

Selecione o manipulador para editar requerido e arraste. A posição sobre a qual se solta o botão do mouse é mantida.

NOTA: A não ser que o tipo de âncora esteja numa posição direita, o manipulador da rotação estará no posição direita superior. Igualmente, quando um tipo de âncora de lado direito for selecionada, o manipulador de rotação estará na posição esquerda superior.

Manipuladores de edição podem ser localizados nas seguintes posições:

NOTA: A linha de base indica a posição mais baixa das letras que não incluem as hastes descendentes (isto é, o espaço da base à linha de base é a área onde as hastes descendentes de minúsculas são posicionadas).

Curvas

Para mudar a tangente de entrada ou a tangente de saída de curvas, selecione as curvas, mova o ponteiro do mouse sobre elas e localize os indicadores de rotação. Existem dois indicadores para cada curva (um indicador da tangente de entrada e um indicador de tangente de saída).

O ponteiro muda para [image] quando se coloca o ponteiro sobre o indicador de editar.

O ponteiro de rotação lhe permite girar a curva ou curvas selecionadas.

NOTA: Com duas curvas que se unem, pode-se girar ambas curvas usando um manipulador de edição. O Trimble Geomatics Office configura e mantém automaticamente uma tangente comum entre curvas que se unem.

Para passar para entidades existentes, mantenha apertado Ctrl. Por padrão, a passagem para entidades existentes está desabilitada.

Pontos

A moção de pontos significa uma simples translação de pontos do banco de dados. Para mover um ou mais pontos; selecione os pontos, mova o ponteiro sobre eles e localize o manipulador de edição. O ponteiro muda para [image] quando se coloca o ponteiro sobre o manipulador. Quando os pontos estão na posição desejada, solte o botão. Aparece o diálogo Mover Pontos e Texto. Use este diálogo para editar e confirmar os valores.

O arraste de pontos faz com que todos os pontos selecionados e texto movam-se.


Pontos sem nomes

Dentro do projeto, cada entidade é registrada com um só manipulador. O manipulador é um valor inteiro único que o Trimble Geomatics Office usa para identificar o ponto. Isso significa que mesmo quando um ponto possui nenhum nome, o Trimble Geomatics Office reconhece o ponto através do seu manipulador interno.

Quando um ponto sem nome requer um nome (por exemplo, quando for selecionado como um ponto final no diálogo Adicionar pontos) o atual manipulador do banco de dados para os pontos aparece. Na frente do nome aparece o caractere de igual (=). Este é o método de software para identificar o ponto que foi selecionado.


Barra de Status

A barra de status está localizada na base da janela de gráficos. Ela exibe informações sobre o status atual do software, incluindo informações da coordenada.

Quando se move o mouse sobre a área de visualização da Linha do tempo, a barra de status exibe informações do horário. Ela pode exibir a hora local do Windows ou semana/segundos GPS, dependendo das configurações da opção da hora.

Quando o Trimble Geomatics Office estiver executando determinadas tarefas, tais como o processamento de linhas da base, a barra de status torna-se um indicador de progresso.

Para maiores informações sobre os indicadores da barra de status, consulte o Manual do Usuário do Trimble Geomatics Office.


Barra de status - Ângulo da janela

O ângulo da janela lhe permite modificar o tamanho da janela principal dos gráficos.


Indicador de Progresso

A apresentação da barra de status muda para um indicador de progresso quando o Trimble Geomatics Office está efetuando determinadas tarefas.

Aparece uma breve descrição da tarefa, seguida por um gráfico da barra que mostra a porcentagem da tarefa que já foi completada.

Quando uma tarefa pode ser interrompida, o indicador de progresso exibe a mensagem Pressionar ESC para cancelar. Quando isso aparece, pressione Esc para terminar a tarefa. Quando uma tarefa não pode ser interrompida, esta mensagem não aparece.


Comando Restaurar

Use este comando para voltar a janela ativa para tamanho e posição originais.

Para acessá-lo:

1.	Faça um dentre os seguintes:

  Clique o botão Trimble Geomatics Office [image] na barra do título.

  Clique o lado direito da barra do título.

  Clique o botão do Sistema [image] na barra do menu.

Abre-se o menu Sistema.

2.	Selecione Restaurar do menu Sistema.


Comando Mover

Use este comando para apresentar uma seta de quatro pontas para que possa mover a janela ativa ou quadro de diálogo com as teclas de seta.

Para acessá-lo:

1.	Faça um dentre os seguintes:

  Clique o botão Trimble Geomatics Office [image] na barra do título.

  Clique o lado direito da barra do título.

  Clique o botão Sistema [image] na barra do menu.

Abre-se o menu Sistema.

2.	Selecione Mover do menu Sistema.

NOTA: Este comando não fica mais disponível quando se maximiza a janela.


Comando Tamanho

Use este comando para apresentar uma seta de quatro pontas para modificar o tamanho da janela ativa com as teclas de seta.

Para acessá-la:

1.	Faça um dentre os seguintes:

  Na barra de título, clique o botão Trimble Geomatics Office [image].

  Clique o lado direito na barra de títulos.

  Na barra do menu, clique o botão Sistema [image].

Abre-se o menu Sistema.

2.	Selecione Tamanho no menu Sistema.

Depois que o ponteiro muda para a seta de quatro pontas:

1.	Pressione uma das teclas de direção (teclas de seta esquerda, direita, para cima, para baixo) para mover o ponteiro para a margem que deseja mover.

2.	Pressione uma tecla de direção para mover a margem.

3.	Pressione Inserir quando a janela estiver no tamanho desejado.

NOTA: Este comando não fica mais disponível quando se maximiza a janela.


Comando Minimizar

Use este comando para reduzir a janela do quadro do Trimble Geomatics Office para o tamanho de um ícone.

Para acessá-lo:

1.	Faça um dentre o seguinte:

  Na barra do título, clique o botão Trimble Geomatics Office [image].

  Clique a barra do título com o lado direito do mouse.

  Na barra do menu, clique o botão Sistema [image].

Abre-se o menu Sistema.

2.	Selecione Minimizar do menu Sistema.


Comando Maximizar

Use este comando para aumentar a janela ativada para preencher todo o espaço disponível.

Para acessá-lo:

1.	Faça um dentre o seguinte:

  Na barra de título, clique o botão Trimble Geomatics Office [image].

  Clique a barra com o lado direito do mouse.

  Na barra de título, clique o botão Sistema [image].

Abre-se o menu Sistema.

2.	Selecione Maximizar do menu Sistema.


Comando Fechar

Use este comando para fechar a janela ou quadro de diálogo ativo.

Para acessá-lo:

1.	Faça um dentre o seguinte:

  Na barra do título, clique o botão Trimble Geomatics Office [image].

  Clique a barra com o lado direito do mouse.

  Na barra do menu, clique o botão Sistema [image].

Abre-se o menu Sistema.

2.	Selecione Fechar do menu Sistema.


Comando Próximo

Use este comando para alternar para a próxima janela de gráficos de acordo com a ordem na qual elas foram abertas.

Para acessá-lo:

1.	Faça um dentre o seguinte:

  Na barra do título, clique o botão Trimble Geomatics Office [image].

  Clique com o lado direito a barra do título.

  Na barra do menu, clique o botão Sistema [image].

Abre-se o menu Sistema.

2.	Selecione Próximo a partir do menu Sistema.


Comando Anterior

Use este comando para alternar para a janela anterior do quadro aberto, de acordo com a ordem na qual elas foram abertas.

Para acessá-lo:

1.	Faça um dentre o seguinte:

 Na barra do título, clique o botão Trimble Geomatics Office [image].

 Clique com o lado direito a barra do título.

 Na barra do menu, clique o botão Sistema [image].

Abre-se o menu Sistema.

2.	Selecione Anterior a partir do menu Sistema.


Comando Alternar para

Use este comando para apresentar uma lista de todas as aplicações abertas.

Use a opção da Lista de tarefas para alternar para ou fechar uma aplicação na lista.

Opções do diálogo

Ao selecionar o comando Alternar para, abre-se um diálogo com as seguintes opções:

Opção	Descrição
Lista de tarefas	Seleciona a aplicação que deseja mudar ou fechar.
Alternar para	Torna ativa a aplicação selecionada.
Finalizar tarefa	Fecha a aplicação selecionada.
Cancelar	Fecha a opção Lista de tarefas.
Cascata	Ordena as aplicações abertas para que elas se sobreponham, mantendo todas barras de títulos visíveis. Esta opção não afeta as aplicações que foram reduzidas ao tamanho de um ícone.
Lado a lado	Ordena aplicações abertas em janelas que não se sobrepõem. Esta opção não afeta as aplicações que foram reduzidas a ícones.
Organizar ícones	Ordena os ícones de todas as aplicações minimizadas na base da tela.


Arrastando e soltando arquivos no Trimble Geomatics Office

Perspectiva Geral e Mais Informações	Como ...

Use a funcionalidade ‘arrastar e soltar’ do Windows Explorer e Microsoft Windows para importar arquivos de dados de uma pasta do seu computador para um projeto do Trimble Geomatics Office.

Pode-se importar qualquer tipo de arquivo disponível nas guias do diálogo Importar.

NOTA: Não pode-se arrastar e soltar arquivos com as extensões .job ou .raw de um PC-card para um projeto do Trimble Geomatics Office. Para transferir estes arquivos para um projeto Trimble Geomatics Office, use o Trimble Geomatics Office para transferir estes arquivos. Este software converte os arquivos para o formato correto.

Formatos separados

Pode-se usar qualquer um dos botões do mouse para arrastar e soltar arquivos.

Sempre é mais seguro usar o botão do lado direito do mouse porque quando se solta:

  o botão do lado direito após o arraste, aparece uma lista de formatos de importação disponíveis. Pode-se selecionar o formato correto da lista.

  o botão do lado esquerdo após o arraste, o Trimble Geomatics Office usa a extensão do arquivo e determina o formato de arquivo que se está importando. Não há garantia de que o formato correto de arquivo será selecionado pelo software.

Formatos múltiplos

Pode-se usar qualquer um dos botões do mouse para arrastar e soltar vários arquivos de uma só vez.

  Com o botão direito do mouse, pode-se arrastar e soltar vários arquivos do mesmo tipo. Uma lista de formatos disponíveis aparece, onde pode-se selecionar o formato correto para importar. Se você arrastar e soltar uma seleção de diferentes tipos de arquivo (por exemplo, um arquivo .dc e um arquivo .dat), as opções individuais de importação não aparecem na lista. Selecione Padrão da lista para usar as opções de importação para cada tipo de arquivo. O Trimble Geomatics Office usa a extensão dos arquivos e determina os formatos de arquivo que estão sendo importados. No entanto, não há garantia de que o formato correto de arquivo será selecionado pelo software.

  Com o botão esquerdo do mouse pode-se arrastar e soltar arquivos de tipos diferentes. O Trimble Geomatics Office usa a extensão dos arquivos e determina os formatos do arquivo que se está importando. No entanto, não há garantia de que o formato correto de arquivo será selecionado pelo software.

NOTA: Se o Trimble Geomatics Office não reconhecer nenhum dos formatos importados através de ‘arrastar e soltar’, aparece um menu de atalho que lhe dá a opção de importá-los como arquivos de coletor de dados Terceiro ou como arquivos NMEA. Se escolher a opção Padrão, o Trimble Geomatics Office tentará importá-los como arquivos NMEA.

Formatos personalizados

São todos formatos de importação personalizados criados no menu de atalho quando se usa o botão direito do mouse para arrastar e soltar um arquivo para um projeto do Trimble Geomatics Office.

SUGESTÃO: Se você não tiver um projeto aberto, pode-se arrastar o arquivo Opções.ini do projeto para o Trimble Geomatics Office para abrir o projeto.


Menus de Atalho

Os menus de atalho são menus sensitivos ao contexto, com comandos que variam dependendo de onde se posiciona o ponteiro.

Pode-se usar menus de atalho para tarefas comuns tais como:

  aceso de comandos e diálogos de menu usados com freqüência

  comutar configurações da apresentação

  inserir códigos de campo

Para acessar um menu de atalho:

1.	Coloque o ponteiro sobre a área apropriada.

2.	Clique o botão direito do mouse.


Teclas Quentes

Teclas quentes fornecem um modo rápido de usar o teclado para selecionar uma opção de um menu ou diálogo. Elas aparecem como letras sublinhadas na descrição da opção.

Pressione a tecla no teclado correspondente à letra sublinhada na opção que deseja selecionar.


Sistemas de coordenadas - Perspectiva geral

Mais informações

Como...	Diálogo	Veja também
Perspectiva geral

O Trimble Geomatics Office usa um sistema de coordenadas para transformar medidas em uma superfície curva (a terra) para uma superfície plana (um mapa ou plano). Por exemplo, um sistema de coordenadas é usado para coordenadas do grid para um ponto medido usando GPS (medidas GPS são feitas no elipsóide WGS-84).

Um sistema de coordenadas pode consistir dos seguintes elementos:

  uma transformação de datum (entre o elipsóide WGS-84 e o elipsóide local)

  uma projeção

  um modelo geoidal

  uma calibração de local GPS (consistindo de uma configuração horizontal e uma configuração vertical)

Você deve selecionar um sistema de coordenadas para todos os projetos. Alternativamente, se você não tiver um sistema (ou souber qual sistema selecionar) use a projeção padrão.

NOTA: Assegure-se de que os pontos em um projeto estejam dentro de uma distância razoável da origem da projeção de acordo com as propriedades da projeção usada.

Banco de dados do sistema de coordenadas

O banco de dados do sistema de coordenadas é armazenado como um arquivo chamado Current.csd. Ele contém toda a informação do sistema de coordenadas. A Trimble fornece um conjunto extenso de sistemas de coordenadas publicados de todo o mundo. Para definir ou editar sistemas de coordenadas, zonas, locais, transformações de datum, modelos elipsóides, e geóides, use a utilidade Trimble Coordinate System Manager™.

Selecionando um sistema de coordenadas

Para selecionar o sistema de coordenadas para um projeto, use um dentre os seguintes:

  um sistema de coordenadas e zona do banco de dados do sistema de coordenadas

  um local do banco de dados do sistema de coordenadas

  uma projeção padrão indefinida

  uma projeção padrão definida

  sistema de coordenadas especificado em um arquivo Survey Controller (*.dc) durante importação

Quando você seleciona um sistema de coordenadas no software Trimble Geomatics Office, parâmetros são obtidos do banco de dados do sistema de coordenadas.

Mudando o sistema de coordenadas para um projeto

Para mudar os sistema de coordenadas para um projeto, faça um dentre os seguintes:

  Especifique um novo sistema de coordenadas usando o Diálogo de Propriedades do Projeto.

  Importe dentro um projeto Trimble Geomatics Office um arquivo Survey Controller (*.dc) com um sistema de coordenadas diferente. Isto é, se o projeto tiver um sistema de coordenadas e o arquivo .dc tiver um sistema de coordenadas diferente, então durante a importação o software detecta a diferença e lhe pede que selecione qual usar. Esse é um método de mudar o sistema de coordenadas para um projeto se você escolher usar o sistema de arquivo .dc.

Quando você muda o sistema de coordenadas para um projeto, o Trimble Geomatics Office computa as coordenadas de todos os pontos. As coordenadas são transformadas do sistema de coordenadas antigo para o novo sistema de coordenadas. O processo geral para isso é como segue:

1.	Todas as coordenadas são reduzidas para o elipsóide. O elipsóide é normalmente o elipsóide WGS-84, mas quando somente a projeção tiver mudado, é o elipsóide local.

2.	Coordenadas novas são calculadas usando os parâmetros novos.

Esses passos são ilustrados na figura seguinte:

Se um modelo geóide ou configuração vertical é parte do sistema de coordenadas antigo, ele é usado para calcular as alturas do WGS-84 para todos os pontos que não são derivados de observações de campo. Da mesma forma, se um modelo geoidal ou configuração vertical é aplicado no novo sistema de coordenadas, ele é usado para calcular a nova elevação das coordenadas do grid das alturas do WGS-84.

O modo de mudança do sistema de coordenadas afeta os softwares RoadLink e DTMLink

Quando você exporta pontos do projeto para o software Trimble RoadLink™ ou o software Trimble DTMLink™, os pontos que você exporta não são atualizados por mudanças subsequentes ao projeto Trimble Geomatics Office.

A Trimble recomenda que você não exporte pontos até que você esteja confiante de que todas as mudanças para o projeto Trimble Geomatics Office estejam completas.

Se você já tiver exportado pontos do projeto Trimble Geomatics Office dentro do software Trimble Roadlink ou do software Trimble DTMLink, e você mudar o sistema de coordenadas ou calibrar seus dados no projeto Trimble Geomatics Office, o seguinte aviso aparece:

Coordenadas para pontos no DTMLink e RoadLink não serão atualizadas quando você mudar o sistema de coordenadas.

Escolha uma das seguintes opções:

  Clique OK para reconhecer que as coordenadas do ponto não vão mudar no software Trimble RoadLink ou no software Trimble DTMLink.

  Clique Cancelar para cancelar a mudança.

Para assegurar que as últimas coordenadas sejam usadas no software Trimble RoadLink e no software Trimble DTMLink:

1.	Apague os pontos indesejados no software Trimble RoadLink e/ou DTMLink.

2.	Exporte novamente os pontos do projeto Trimble Geomatics Office.


Sistemas de Coordenadas de Solo

Se você requerer que as coordenadas estejam ao nível do solo invés de ao nível da projeção, use um sistema de coordenadas de solo. Quando você selecionar um sistema de coordenadas de solo, distâncias de grid são iguais a distâncias de solo.

Para usar as suas coordenadas de solo no software Trimble Geomatics Office, você necessita:

1.	Definir um sistema de coordenadas para o projeto.

2.	Digitar coordenadas para a localização do projeto. A localização do projeto é salvada como latitude e longitude locais.

3.	Digitar o fator de escala de solo, ou compute ele usando as coordenadas para a localização do projeto.

Definindo um sistema de coordenadas para o projeto

Para informação sobre como selecionar e mudar um sistema de coordenadas em um projeto Trimble Geomatics Office, veja o tópico Coordinate System - Perspectiva geral .

Digitando coordenadas para a localização do projeto

Para fazer isso:

1.	Selecione Arquivo / Propriedades do Projeto. Aparece o diálogo Propriedades do projeto.

2.	Selecione a guia do Sistema de Coordenadas.

3.	No grupo de configurações Local, clique Mude. O diálogo de configuração Local aparece.

4.	No grupo de localização do projeto, digite as coordenadas adequadas. Se o sistema de coordenadas está indefinido, você será solicitado para atualizar o sistema de coordenadas.

A latitude e longitude precisam ser aproximadas, e a elevação precisa ser uma estimativa razoável da elevação, portanto digite uma elevação média para o projeto.

Fator de Escala de Solo

Para fazer isso:

1.	No diálogo de configuração de Local, selecione a caixa de verificação do Use coordenadas de solo e faça um dentre os seguintes:

  Digite o fator de escala de solo.

  Selecione o fator de escala Compute da caixa de verificação da localização do projeto. O software computa o fator de escala de solo desde os valores no grupo de localização do Projeto.

  Determine como as coordenadas de solo são exibidas. Você pode especificar um offset norte e/ou leste, ou coordenadas de quatro ou cinco dígitos. Use esta opção para diferenciar facilmente entre coordenadas.

NOTE: O sistema de coordenadas de solo assume que você está trabalhando próximo à localização do projeto e que não existem grandes variações na altura do projeto.

O fator de escala de solo é calculado:

1.	Determinando a elevação de referência (h)

2.	Calculando o fator de elevação

Onde:

R é o rádio do elipsóide

h é a elevação de referência

a é o eixo semi-maior

e2 é o quadrado da excentricidade

φ a latitude da origem da projeção

3. 	Computando o Fator de Escala de Solo no centróide no local do projeto.

Onde:

s é o fator de escala do grid no local do projeto.

Na versão 10 do Trimble Survey Controller, os Sistemas de Coordenadas de Solo são totalmente suportados. As notas seguintes tratam dos Sistemas de Coordenadas de Solo da versão 7.7 e anteriores do Trimble Survey Controller.

NOTAS:

Importando projetos com coordenadas de solo desde as versões 7.5 – 7.7 do software Trimble Survey Controller

Se você importar um trabalho Trimble Survey Controller (versão 7.5 ou versão 7.7) com uma projeção Transversa de Mercator na qual um fator de escala de solo tenha sido definido (por exemplo, um trabalho não projeção/não datum com uma calibração) deixe limpa a caixa de verificação Use coordenadas de solo no diálogo de configurações de Local. Do contrário, o fator de escala de solo será aplicado duas vezes.

Quando você importa um trabalho Trimble Survey Controller com um fator de escala de solo definido dentro de um projeto Trimble Geomatics Office que não tenha um sistema de coordenadas de solo definido, então uma mensagem de advertência diz a você que o sistema de coordenadas no trabalho e projeto são diferentes. Use o sistema de coordenadas que está no projeto do Trimble Geomatics Office e marque a caixa de seleção Usar coordenadas de solo no diálogo Configuração do local.

Exportando projetos com coordenadas de solo para as versões 7.5 – 7.7 do Trimble Survey Controller

Se você exporta um projeto Trimble Geomatics Office com um sistema de coordenadas de solo definido para o Trimble Survey Controller (versão 7.7 ou anterior), o sistema de coordenadas será diferente quando você reimportá-lo para o software Trimble Geomatics Office. Assegure-se de aceitar o sistema de coordenadas Trimble Geomatics Office.

O Trimble Survey Controller (versão 7.7 ou anterior) não aceita coordenadas de solo com a projeção Lambert Conformal Conic 2 Parallel. O sistema de coordenadas é exportado desde o Trimble Geomatics Office para o Trimble Survey Controller com uma projeção Um Paralelo Cônico Conforme Lambert.

O Trimble Survey Controller (versão 7.7 ou anterior) não aceita coordenadas de solo com a projeção Albers Equal Area Conic. Se você quiser exportar um projeto com uma projeção Albers Equal Area Conic definida para o software Trimble Survey Controller, remova as coordenadas de solo ou mude projeções.


Transformações do Datum - Perspectiva geral

Mais Informações

 Veja também

Perspectiva geral

Uma transformação de datum é um conjunto de parâmetros usados para converter coordenadas de um elipsóide (por exemplo, o elipsóide WGS-84) para coordenadas no elipsóide local. (O elipsóide local é o elipsóide usada pela projeção). Uma transformação de datum é parte de uma definição de um sistema de coordenadas.

Os seguintes métodos de transformação de datum são disponíveis:

  Molodensky (três parâmetros)

  sete parâmetros

  grid de datum

  regressão múltipla

Todos os métodos são armazenados no banco de dados do sistema de coordenadas.

Para definir novas transformações de datum, edite o banco de dados do sistema de coordenadas usando a utilidade Trimble Coordinate System Manager.


Transformação de Datum - Molodensky (Três parâmetros)

 Perspectiva geral e Mais Informações

A transformação de datum Molodensky define uma tradução nas direções X, Y, e Z entre a origem do elipsóide WGS-84 e a origem do elipsóide local (ou vice-versa).

A transformação de datum Molodensky é às vezes denominada uma transformação de datum de três parâmetros.

Visualizando detalhes

Se você tem uma transformação de datum Molodensky definida como parte do sistema de coordenadas do seu projeto, você pode visualizar os valores da transformação de datum.

Para fazer isso, use o diálogo dos Detalhes do Sistema de Coordenadas.

Esses campos definem uma transformação cartesiana (X, Y, Z) tridimensional desde a origem do elipsóide WGS-84 até a origem do elipsóide local.

Transformações de datum são armazenadas no banco de dados do sistema de coordenadas (Current.csd). Para editá-las, use a utilidade Trimble Coordinate System Manager™.


Transformação de Datum - Sete parâmetros

 Perspectiva geral e Mais Informações

A transformação de datum de sete parâmetros define uma transformação desde o elipsóide WGS-84 para um elipsóide local, ou de um elipsóide local para o elipsóide WGS-84.

Translação

Esses campos definem uma transformação cartesiana (X, Y, Z) tridimensional desde a origem do elipsóide WGS-84 até a origem do elipsóide local.

Rotação

Os valores de X de rotação definem os ângulos de rotação em relação aos eixos X, Y, e Z respectivamente. Esses são os ângulos através dos quais os eixos cartesianos do elipsóide WGS-84 devem ser rotacionados para alinhá-los ao eixo do elipsóide local.

O ângulo de rotação é positivo para uma rotação em sentido horário em relação a cada eixo, vista desde a extremidade positiva do eixo.

Fator de Escala

Todas as coordenadas são multiplicadas por este valor. É definido em partes por milhão. Se o fator de escala é 6.02, todas as coordenadas são multiplicadas por 1.00000602.

Visualizando detalhes

Se você tem uma transformação de datum de sete parâmetros definida como parte do sistema de coordenadas de seu projeto, você pode visualizar os valores de transformação de datum.

Para fazer isso, use o diálogo de detalhes do Sistema de Coordenadas – guia da Transformação de datum.

Transformações de datum são armazenadas no banco de dados do sistema de coordenadas (Current.csd). Para editá-las, use a utilidade Trimble Coordinate System Manager™.


Transformação de Datum - Grid de Datum

 Perspectiva geral e Mais Informações

A transformação de datum Grid de Datum é um arquivo publicado contendo valores para os parâmetros da transformação de datum para a área. O arquivo é usado para interpolar os valores de transformação de datum na sua localização.

Para usar um grid de datum como parte da definição do sistema de coordenadas do sistema, você deve selecionar uma transformação de datum que é definida por um arquivo grid de datum de latitude e longitude (*.dgf).

Para visualizar ou criar uma transformação de datum usando arquivos grid de datum, use a utilidade Trimble Coordinate System Manager.

Para usar o arquivo grid de datum no campo, você necessita transferir o arquivo grid de datum como um arquivo combinado de grid de datum para o Trimble Survey Controller (versão 7.00 ou posterior).


Transformação de Datum - Regressão Múltipla

 Perspectiva geral e Mais Informações

Uma transformação de datum de Regressão Múltipla define uma transformação entre o elipsóide WGS-84 e um elipsóide local adequando uma equação polinomial às mudanças previstas na área local. Para adicionar uma transformação de datum de Regressão Múltipla, use a utilidade Trimble Coordinate System Manager™.

Visualizando detalhes

Se você tem uma transformação de dados de Regressão Múltipla definida como parte do sistema de coordenadas do seu projeto, você pode visualizar os valores de transformação de datum.

Para fazer isso, use o diálogo de detalhes do Sistema de Coordenadas – guia Transformação de datum.

Transformações de datum são armazenadas no banco de dados do sistema de coordenadas (Current.csd). Para editá-las, use a utilidade do Sistema de Coordenadas.


Projeções - Perspectiva geral

Mais Informações

 Veja também

Perspectiva geral

Uma projeção é uma expressão matemática para a superfície curva de um elipsóide em um grid de coordenadas retangulares.

Use uma projeção para transformar coordenadas geodésicas locais em coordenadas de grid locais.

Coordenadas de grid são traçadas para criar mapas que representem a superfície da terra ou partes dessa superfície.

Diferentes países e regiões usam diferentes projeções para ativar mínimas distorções nas coordenadas de grid resultantes. A utilidade Trimble Coordinate System Manager™ contém um grande número de projeções (por exemplo, Transversa de Mercator e Lambert One Parallel). Para mais informações sobre projeções específicas, veja a ajuda da utilidade Trimble Coordinate System Manager.

NOTA: Assegure-se de que os pontos em um projeto esteja dentro de uma distância razoável desde a origem da projeção de acordo com as propriedades da projeção usada.

Para definir parâmetros de projeção como parte de uma definição de sistema de coordenadas, use a utilidade Trimble Coordinate System Manager™.


Modelos Geoidais - Perspectiva geral

Mais Informações

 Veja também

Perspectiva geral

Um geóide é uma superfície de potencial gravitacional constante que aproxima-se ao nível do mar.

Pontos observados com GPS têm alturas baseadas no elipsóide WGS-84. Essas alturas são conhecidas com alturas de elipsóides.

Um modelo geoidal permite-nos estimar elevações baseadas nas alturas dos elipsóides.

Modelos geoidais são armazenados como arquivos de Grid de Geóides (*.ggf). Um arquivo. ggf contém separações geoidais para um número de posições em um grid. Usando interpolação, essas separações geoidais podem ser calculadas para qualquer ponto que caia dentro do grid.

Quando um modelo geoidal for selecionado para cada ponto observado usando GPS, o Trimble Geomatics Office usa o arquivo .ggf  para interpolar a separação geoidal (N) naquela localização. Ele então subtrai ou adiciona o valor da altura observada do elipsóide (h). Isso fornece uma elevação aproximada sobre o nível do mar (e) para o ponto do GPS. A relação entre o geóide e o elipsóide local é mostrada na seguinte figura:

Para definir um modelo geoidal novo, usando um arquivo de grid geoidal já existente, use a utilidade Trimble Coordinate System Manager™.  Todos os modelos geoidais no banco de dados do sistema de coordenadas são disponíveis quando você seleciona o sistema de coordenadas para um projeto.

Você pode usar o Trimble Geomatics Office para exportar arquivos de grid de geóides para o Trimble Survey Controller ou para o software TDS Survey Pro CE (versão 3.5 ou mais recente), e criar sub-grids de arquivos de grid existentes.

NOTA: Se você não usar um modelo geoidal ou fizer uma Calibração do Local do GPS, a elevação de um ponto será a mesma da altura do elipsóide e não será uma elevação verdadeira. Se o modelo geoidal é usado no sistema de coordenadas do projeto, então ele é usado para converter entre alturas de elipsóides locais e elevações para todos os tipos de pontos, não somente GPS.


Mudar o Sistema de Coordenadas - Selecionar o diálogo do Sistema de Coordenadas

Use esse diálogo para selecionar um sistema de coordenadas já existente, local, ou para definir uma projeção padrão para o projeto.

Esse diálogo é o primeiro passo de um assistente que guia você através das configurações da seleção.

Clique Próximo para ir em frente e Voltar para retornar através dos diálogos de seleção.

O Trimble Geomatics Office usa sistemas de coordenadas no arquivo de banco de dados do sistema de coordenadas (Current.csd). Você pode editar os parâmetros de um sistema de coordenadas usando a utilidade Trimble Coordinate System Manager™.

Sistema Novo

Para selecionar um sistema de coordenadas e zona novos, um local calibrado que tenha sido salvado no banco de dados do sistema de coordenadas, ou uma projeção padrão:

1.	Selecione Sistema Novo.

2.	Clique Próximo para ir para o diálogo Selecione Tipo do Sistema de Coordenadas.

3.	Use o assistente para selecionar um sistema de coordenadas para o projeto.

Sistema recentemente usado

Para selecionar o sistema de coordenadas de uma lista de dez sistemas de coordenadas mais recentemente selecionados:

1.	Clique Sistema recentemente usado.

2.	Clique os botões de setas para rolar através dos sumários de seus sistemas.

3.	Selecione o sistema de coordenadas que você quer usar para o seu projeto.

4.	Clique Terminar.

NOTA: Se é a primeira vez que você usou o banco de dados do sistema de coordenadas, o diálogo Selecione Tipo do Sistema de Coordenadas aparece (e não o Mude Sistema de Coordenadas – Selecione diálogo de Sistema de Coordenadas). Isso é porque não existem sistemas recentemente usados para selecionar.

NOTA: O Trimble Geomatics Office não aceita todos os sistemas de coordenadas disponíveis na utilidade Gerenciador do Sistema de Coordenadas. Se você selecionar um sistema de coordenadas que não é aceito, a seguinte mensagem aparece:

 Tipo de Sistema de Coordenadas Desconhecido.


Selecionar um diálogo de Tipo de Sistema de Coordenadas

Use esse diálogo para selecionar o tipo de sistema de coordenadas que você quer usar.

Sistema de Coordenadas e Zona

Selecione essa opção para escolher um sistema de coordenadas de seu banco de dados do sistema de coordenadas.

Local Calibrado

Selecione essa opção para escolher um local calibrado que você tenha previamente salvado no banco de dados do sistema de coordenadas. Locais são detalhes de sistema de coordenadas armazenados para locais que podem incluir parâmetros de calibração de GPS.

Projeção Padrão (Transversa de Mercator)

Selecione esta opção para definir a projeção padrão.

Voltar

Clique Voltar para retornar ao diálogo Selecione Sistema de Coordenadas.

NOTA: Se essa é a primeira vez que você usou o banco de dados do sistema de coordenadas, Voltar não está disponível porque não existem sistemas recentemente usados para selecionar.

Próximo

Clique Próximo. Dependendo na opção que você selecionar, um do seguintes diálogos aparece:

  Selecione diálogo do Sistema de Coordenadas.

  Selecione diálogo do Local Calibrado.

  Diálogo de projeção Padrão (Transversa de Mercator).


Selecionar diálogo de Sistema de Coordenadas

Use esse diálogo para selecionar o sistema de coordenadas para o projeto da lista de sistemas de coordenadas disponíveis no banco de dados de sistema de coordenadas.

Para visualizar essas propriedades de um grupo ou zona de sistema de coordenadas:

1.	Realce o grupo ou zona do sistema de coordenadas.

2.	Clique à direita para acessar o menu de atalho e selecione Propriedades.

Grupo de Sistema de Coordenadas

Essa lista contém os sistemas de coordenadas no banco de dados do sistema de coordenadas. Um sistema contém uma ou mais zonas que foram definidas para áreas diferentes.

Zona

Essa lista contém as zonas disponíveis para sistema de coordenadas selecionados. Uma zona contém uma transformação de datum (incluindo um elipsóide e um conjunto de parâmetros de transformação para transformar dados do elipsóide WGS-84 para o elipsóide local), modelo geoidal, e parâmetros de projeção.

Voltar

Clique Voltar para retornar ao diálogo Selecione Tipo de Sistema de Coordenadas.

Próximo

Clique Próximo. O diálogo Selecione Modelo Geoidal aparece.


Selecionar diálogo do Local Calibrado

Use esse diálogo para selecionar um local calibrado da lista de locais calibrados disponíveis no banco de dados do sistema de coordenadas. Locais são armazenados no banco de dados do sistema de coordenadas. Você cria locais na utilidade Trimble Coordinate System Manager™, ou no software Trimble Geomatics Office (no Arquivo/ Propriedades do Projeto / guia ou Levantamento do Sistema de Coordenadas / Calibração do Local GPS)

Para visualizar as propriedades de um local:

1.	Realce o nome do local.

2.	Clique à direita para acessar o menu de atalho e selecione Propriedades.

Detalhes do Local

Esse grupo mostra a transformação de datum e o modelo geoidal para o local realçado.

Voltar

Clique Voltar para retornar para o  diálogo Selecione Tipo Sistema de Coordenadas.

Terminar

Clique Terminar para completar a definição do sistema de coordenadas e retornar ao diálogo de Propriedades do Projeto. A definição de local que você selecionou é o sistema de coordenadas para o projeto.

NOTA: Você não pode mudar o modelo geoidal para um local no Trimble Geomatics Office. O modelo geoidal especificado para o local será usado. Para mudar o modelo geoidal para um site, use a utilidade Trimble Coordinate System Manager. A  utilidade permite que você edite o local.


Diálogo da Projeção Padrão (Transversa de Mercator)

Use esse diálogo para especificar os parâmetros de projeção padrão. O Trimble Geomatics Office pode calcular os valores ou você pode fornecê-los.

Calcular parâmetros de projeções automaticamente

Selecione essa caixa de verificação para configurar o Trimble Geomatics Office para automaticamente usar a primeira posição WGS-84 digitada no projeto como a origem, e a primeira coordenada grid (Norte e Leste) para calcular o Norte falso e Leste falso.

NOTA: Você deve também especificar o sistema de azimute sul (se requerido) e direção de coordenada positiva. O Trimble Geomatics Office não atualiza automaticamente esses campos.

Desmarque essa caixa de verificação para digitar parâmetros de projeção. Os seguintes campos no diálogo tornam-se disponíveis. Digite os valores nestes campos.

Latitude Central

Digite a latitude da origem da projeção.

Longitude Central

Digite a longitude da origem da projeção.

Norte Falso e Leste Falso

Digite o leste falso e norte falso para a projeção padrão. O leste falso e norte falso são as coordenadas de grid da origem da projeção padrão.

Fator de escala

Digite o fator de escala para a origem. Ele deve ser baseado em um fator de escala conhecido para a projeção. Isso representa o índice de distância na projeção em relação à distância na superfície da terra. Todas as coordenadas de solo estão em escala com esse valor para fornecer distâncias de grid.

Sistema de Azimute Sul

Selecione esse campo para especificar um sistema de azimute sul. Um sistema de azimute sul usa sul como azimute de zero graus. Ele é usado no Hawai e África do Sul (outros sistemas usam norte como azimute de zero graus).

Direção de Coordenadas Positivas

Selecione as opções para especificar a direção na qual você quer que os valores de coordenadas aumentem.

Voltar

Clique Voltar para retornar ao diálogo Selecionar Tipo Sistema de Coordenadas.

Próximo

Quando você tiver terminado, clique Próximo. O diálogo Selecionar Modelo Geoidal aparece.


Diálogo Selecionar Modelo Geoidal

Use esse diálogo para selecionar um modelo geoidal para o projeto. Se um modelo geoidal é definido para o sistema de coordenadas no banco de dados do sistema de coordenadas, o modelo geoidal é selecionado automaticamente.

Um modelo geoidal é uma superfície matemática feita de separações geóides/elipsóides. É uma estimativa da separação entre o elipsóide WGS-84 e o nível médio do mar. Um modelo geoidal é usado para derivar alturas ortométricas aproximadas para pontos de GPS.

Sem Modelo Geoidal

Selecione essa opção para especificar que o sistema de coordenadas não tenha um modelo geoidal. Se você não especificar um modelo geoidal a elevação de um ponto é a altura acima do elipsóide local.

Se você selecionar essa opção, a Trimble recomenda que você faça uma calibração do local GPS para conseguir elevações mais precisas para suas observações GPS.

Modelo Geoidal Pré-definido

Para especificar um modelo geoidal para o projeto, selecione um da lista. A lista de modelos geoidais provém do banco de dados do sistema de coordenadas (Current.csd).

Dependendo da precisão do modelo geoidal, uma qualidade é fornecida à elevação derivada da altura do WGS-84 e à separação geoidal. Para especificar a qualidade do modelo geoidal, use o campo da qualidade do Modelo geoidal no diálogo de Propriedades do Projeto / guia Recomputado. A qualidade é usada para determinar a qualidade do campo de elevação para pontos.

Voltar

Clique Voltar para retornar ao diálogo Selecionar Zona de Sistema de Coordenadas ou a diálogo Projeção Padrão (Transversa de Mercator).

Terminar

Clique Terminar para completar a definição do sistema de coordenadas e retornar ao diálogo Propriedades do Projeto.


Locais - Perspectiva geral

Um local é normalmente usado para armazenar detalhes de calibração de locais GPS baseado em um sistema de coordenadas e zona já existentes.

Quando você tiver feito uma calibração de local GPS você pode salvá-la e o sistema de coordenadas para o banco de dados do sistema de coordenadas como um local de forma que você pode facilmente usá-la novamente.

Para salvar um loca, faça um dentre os seguintes:

  Selecionar Levantamento / Calibração de Local GPS.

  Selecionar Arquivo / Propriedades do Projeto / guia do Sistema de Coordenadas.

Alternativamente, você pode criar um novo local usando a utilidade Trimble Coordinate System Manager™. Quando você usar esta utilidade, os locais salvados aparecem na guia de Locais.

Para mais informações, veja a ajuda online da utilidade Trimble Coordinate System Manager.

NOTA: Você não pode salvar parâmetros de transformação de ajustes como um local.


Usar uma Projeção Padrão Indefinida - Perspectiva geral / Diálogo Definição do Projeção Padrão

Perspectiva geral

Uma projeção padrão indefinida é uma projeção padrão sem valores de latitude e longitude de origem. Quando você digita dados de levantamento para um projeto pela primeira vez usando uma projeção padrão indefinida, o diálogo de Definição de Projeção Padrão aparece. O diálogo Definição da Projeção Padrão sugere usar parâmetros de projeção adequados para os dados que você está digitando. Campos diferentes no diálogo estão disponíveis dependendo do tipo de dados que estão sendo adicionados ao projeto. Os seguintes cenários são possíveis:

  Adicionando Pontos GPS a um Projeto (Projeção Padrão Indefinida) Contendo Pontos.

  Um arquivo com uma Projeção Definida para um Projeto com uma Projeção Padrão Indefinida

  Adicionando um Ponto WGS-84 a um Projeto (Projeção Padrão Indefinida).

  Usando arquivo somente Fator Escala (Projeção Padrão Indefinida).

  Adicionando pontos Grid a um projeto vazio.

Para usar uma projeção padrão indefinida, use um modelo de projeto que não tenha um sistema de coordenadas definido (por exemplo, os modelos Métrico Trimble e Pés US).


Adicionar Pontos de Grid (Projeção Padrão Indefinida)

 Perspectiva geral e Mais Informações

O diálogo de Definição da Projeção Padrão aparece quando a primeira posição adicionada ao projeto Trimble Geomatics Office que tem uma projeção padrão indefinida (sem sistema de coordenadas) é uma posição grid.

O diálogo de Definição de Projeção Padrão contém os seguintes campos:

Norte Falso

O norte na origem da projeção. O valor do norte é derivado do primeiro ponto no arquivo.  Você pode mudar este valor.

Leste Falso

O leste na origem da projeção. O valor do leste é derivado do primeiro ponto no arquivo.  Você pode mudar este valor.

OK

Clique OK para aceitar os parâmetros de projeção padrão. Estes valores são usados para definir o sistema de coordenadas para o projeto. Para visualizar esses parâmetros, selecione Arquivo / Propriedades do Projeto / guia do Sistema de Coordenadas e clique Detalhes.

NOTA: Devido a que sua projeção padrão ainda não é totalmente definida (a latitude da origem e a longitude da origem são indefinidas), você pode atualizar a projeção padrão importando um arquivo que contenha um ou mais pontos GPS.


Adicionar Ponto GPS a um Projeto (Projeção Padrão Indefinida) Contendo Pontos de Grid

 Perspectiva geral e Mais Informações

O diálogo Definição da Projeção Padrão aparece quando o projeto Trimble Geomatics Office tem uma projeção indefinida (sem latitude da origem e longitude da origem), contém uma ou mais posições de grid, e:

  um arquivo contendo pelo menos um ponto GPS é importado;

ou

  um ponto WGS-84 é digitado.

O diálogo Definição da Projeção Padrão contém os seguintes campos:

Norte

Este campo é nulo. Digite a coordenada norte mais conhecida para o ponto GPS sendo usado para definir a projeção padrão.

Leste

Este campo é nulo. Digite a coordenada leste mais conhecida para o ponto GPS sendo usado para definir a projeção padrão.

Latitude

A latitude WGS-84 do primeiro ponto GPS no arquivo é mostrada aqui. Este campo não está disponível.

Longitude

A longitude WGS-84 do primeiro ponto GPS no arquivo é mostrada aqui. Este campo não está disponível.

OK

Clique OK para aceitar coordenadas para o ponto GPS. Os valores de latitude WGS-84 e  longitude WGS-84 para a origem são determinados baseados nas coordenadas falsas para a origem (já definidas), e nos valores para o ponto GPS especificados no diálogo. Para ver todos os parâmetros, selecione Arquivo / Propriedades do Projeto / guia do Sistema de Coordenadas e clique Detalhes.

NOTA: Uma vez que um ponto GPS tenha sido adicionado ao banco de dados, a projeção padrão é totalmente definida, a partir de agora quando você importar um arquivo, ou adicionar um ponto ao projeto Trimble Geomatics Office os parâmetros da projeção padrão não serão atualizados. No entanto, você pode atualizar a origem do projeto efetuando uma calibração do GPS (selecione Levantamento / Calibração do Local GPS).


Adicionar um Ponto WGS-84 a um Projeto (Projeção Padrão Indefinida)

O diálogo Definição da Projeção Padrão aparece quando o projeto Trimble Geomatics Office tem uma projeção padrão indefinida (sem latitude de origem e longitude de origem) e

  um ponto WGS-84 é digitado

  um ponto WGS-84 é importado.

O diálogo Definição da Projeção Padrão contém os seguintes campos:

Norte

O padrão deste campo é 0. Digite a coordenada norte mais conhecida para o ponto sendo usado para definir a projeção padrão. Este valor é usado com o Norte Falso para a projeção.

Leste

O padrão deste campo é 0. Digite a coordenada leste mais conhecida para o ponto sendo usado para definir a projeção padrão. Este valor é usado com o Leste Falso para a projeção.

Latitude da origem

A latitude WGS-84 do ponto é mostrada aqui. Este campo é a latitude da origem para a projeção. Este campo não está disponível.

Longitude da origem

A longitude WGS-84 do ponto é mostrada aqui. Este campo é a longitude da origem para a projeção. Este campo não está disponível.

OK

Clique OK para aceitar os parâmetros da projeção padrão. Estes valores são usados para definir o sistema de coordenadas para o projeto. Para visualizar esses parâmetros selecione Propriedades do Projeto / guia do Sistema de Coordenadas e Detalhes.

NOTA: Uma vez que a projeção padrão esteja totalmente definida, a partir de agora quando você importar um arquivo .dc, ou adicionar um ponto ao projeto Trimble Geomatics Office, os parâmetros da projeção padrão não serão atualizados. No entanto, você pode atualizar a origem da projeção efetuando uma calibração GPS (selecione Levantamento / Calibração do Local GPS).


Importar um Arquivo (com uma Projeção Definida) para um Projeto com uma Projeção Padrão Indefinida

 Perspectiva geral e Mais Informações

O sistema de coordenadas do projeto é automaticamente mudado para o sistema de coordenadas especificado no arquivo.

Uma mensagem é escrita para o relatório de importação. Lê-se:

“Os sistemas de coordenadas importados e do projeto eram diferentes. A definição importada foi usada preferencialmente à projeção padrão indefinida (Transversa de Mercator)”


Usar o Sistema de Coordenadas de um Arquivo

 Perspectiva geral e Mais Informações

Quando um arquivo é importado com um sistema definido de coordenadas, a definição do sistema de coordenadas gravada no arquivo é comparada com a definição do sistema de coordenadas para o projeto. Se elas forem diferentes, o diálogo Sistema de Coordenadas do Projeto aparece.

Para usar o sistema de coordenadas especificado no arquivo, selecione a opção definição Converter para o coletor de dados no diálogo Sistema de Coordenadas do Projeto.

Se o sistema de coordenadas no arquivo for qualquer outra coisa que não um sistema de coordenadas Fator de Escala-somente, a definição do sistema de coordenadas do projeto é mudada para a especificada no arquivo.

Se o sistema de coordenadas no arquivo for Fator de Escala-somente, então o que acontece depende do sistema de coordenadas definido para o projeto.

NOTA: Se o sistema de coordenadas do projeto é uma projeção padrão indefinida e não tem pontos, o sistema de coordenadas no arquivo é automaticamente usado e o sistema de coordenadas do projeto mudado para o sistema de coordenadas no arquivo.


Arquivos da Estação Total (Somente fator escala) com Sistema de Coordenadas Não Definido - Perspectiva Geral

Perspectiva geral

Um sistema de coordenadas Fator de Escala-somente pode ser usado para levantamentos onde todas as observações tenham sido feitas com um instrumento convencional (isto é, sem observações GPS).

A maneira em que os arquivos que contêm somente observações terrestres são manejadas no Trimble Geomatics Office depende do sistema de coordenadas definido no projeto Trimble Geomatics Office.

Projeção padrão indefinida

Se o projeto Trimble Geomatics Office tem uma projeção padrão indefinida (sem latitude ou longitude de origem), o diálogo Projeção Padrão  aparece. Pode-se inserir os valores de norte e leste falsos e de escala.

AVISO: Se um ponto já existe no banco de dados, a escala no arquivo não é usada para atualizar a projeção padrão. Assegure-se de que a escala no arquivo é a mesma escala da projeção padrão do projeto.

Sistema de coordenadas definido

Se o projeto Trimble Geomatics Office tem um sistema de coordenadas definido (incluindo a projeção padrão onde os valores de latitude e longitude da origem tenham sido definidos), o sistema de coordenadas do projeto é usado, e a escala no arquivo é considerada como sendo a mesma da escala do sistema de coordenadas do projeto.


Usar Arquivo Fator de Escala-somente (Projeção Padrão Indefinida)

 Perspectiva geral e Mais Informações

O diálogo Definição da Projeção Padrão aparece quando:

•	o arquivo que você está importando contém uma projeção Fator de Escala-somente

•	o projeto Trimble Geomatics Office tem uma projeção padrão indefinida (isto é, a latitude e longitude da origem são indefinidas)

•	não há pontos no banco de dados.

O diálogo contém os seguinte campos:

Norte Falso

O valor norte é derivado do primeiro ponto no arquivo. Você pode mudar os valores para a origem falsa.

Leste Falso

O valor leste é derivado do primeiro ponto no arquivo. Você pode mudar os valores para a origem falsa.

Fator de escala

O fator de escala é derivado do último registro de escala no arquivo. Você pode mudar os valores para o fator de escala.

NOTA: Quando procurando o primeiro ponto no arquivo, pontos apagados não são considerados.

OK

Clique OK para aceitar os parâmetros da projeção padrão. Estes valores são usados para definir o sistema de coordenadas do projeto. Para visualizar estes parâmetros, selecione Arquivo / Propriedades do Projeto / guia do Sistema de Coordenadas e clique Detalhes.

NOTA: Devido a que sua projeção padrão ainda não é totalmente definida (isto é, a latitude e a longitude da origem ainda são indefinidas), a projeção Padrão será atualizada quando um arquivo que contenha uma ou mais posições GPS seja importado.

A correção do nível do mar é desligada a menos que você tenha marcada a caixa de seleção Usar coordenadas de solo no diálogo de configuração do Local.


Usar Arquivos Terrestres com Sistema de Coordenadas do Projeto Definido

Se um sistema de coordenadas é definido para o projeto Trimble Geomatics Office, e você importa um arquivo, aparece uma mensagem declarando que o diálogo sistema de coordenadas já existente do projeto será usado. Os pontos do arquivo são então importados.

O Trimble Geomatics Office presume que a escala do projeto no sistema de coordenadas existente e o fator de escala de solo são equivalentes à escala do arquivo.

Se a opção Usar coordenadas de solo não estiver selecionada no diálogo Configurações do local, você deve certificar-se de que as escalas sejam idênticas antes de importar, e o fator escala do arquivo é equivalente ao fator de escala combinado.

Se a caixa de verificação Usar coordenadas de solo estiver marcada no diálogo Configurações do local, certifique-se de que a elevação do projeto no Trimble Geomatic está correta para os dados importados.


Diálogo do Sistema de Coordenadas do Projeto

Este diálogo aparece quando um arquivo e a definição do sistema de coordenadas gravada no arquivo é diferente da definição do sistema de coordenadas para o projeto, e o sistema de coordenadas do projeto é definido (isto é, sistema de coordenadas do projeto não é uma projeção padrão indefinida).

Sistema de Coordenadas

Para usar o sistema de coordenadas no arquivo, selecione a definição Converter para o coletor de dados. Todos os dados existentes em um banco de dados são atualizados usando a nova definição do sistema de coordenadas.

Para reter a definição do sistema de coordenadas do projeto selecione a opção Mantenha a definição de projeto existente. Os dados no arquivo do coletor de dados são interpretados usando a definição do sistema de coordenadas do projeto.

Para visualizar os detalhes de qualquer dos sistema de coordenadas, clique o botão de Detalhes apropriado.

Sumário

Clique Sumário para visualizar o relatório comparativo dos dois sistemas de coordenadas. Use o relatório para inspecionar os parâmetros completos dos sistemas de coordenadas e encontre a diferença entre eles.


Usar o diálogo Sistema de Coordenadas do Projeto durante a importação do arquivo

Quando um arquivo é importado, a definição do sistema de coordenadas gravada no file é comparada com a definição do sistema de coordenadas para o projeto. Para usar o sistema de coordenadas especificado no projeto, selecione a opção Mantenha a definição do projeto existente no diálogo Sistema de Coordenadas do Projeto.

Projeção Padrão Indefinida

Se o sistema de coordenadas do projeto é uma projeção padrão indefinida, o Atualizar projeção padrão aparece. O primeiro ponto no arquivo é usado para atualizar a projeção Padrão.

Outros sistemas de coordenadas

O arquivo é importado usando o sistema de coordenadas do projeto.

NOTA: Se o sistema de coordenadas no arquivo é Fator de Escala-somente então o que acontece depende do sistema de coordenadas definido para o projeto.


Usar uma Projeção Plana do Trimble Survey Office ou Trimble Survey Controller

O Trimble Geomatics Office não irá atualizar uma projeção Plana indefinida se você fizer um dentre os seguintes:

  exportar um arquivo Gráficos Trimble (*.tgf) do Trimble Survey Office onde o projeto Trimble Survey Office tem uma projeção plana

  exportar um .dc de um projeto do Trimble Survey Office com uma Projeção Plana.

e então você importar o arquivo para o Trimble Geomatics Office, a projeção Plana ainda poderá ser usada para o projeto Trimble Geomatics Office. (Você deve selecionar a opção Use o sistema de coordenadas do .dc file quando o diálogo Sistema de Coordenadas do Projeto aparece).

A Projeção Plana torna-se o sistema de coordenadas selecionado para o projeto. Use o diálogo Propriedades do Projeto / guia do Sistema de Coordenadas para visualizar os detalhes do sistema de coordenadas.


Efetuando um ajuste de rede com dados do arquivo do Fator de Escala-somente (Projeção Padrão Indefinida)

Um arquivo de dados terrestres (ou seja, um arquivo sem observações GPS), pode contar com um sistema de coordenadas que não tem parâmetros definidos além da escala. Isto é, ele não tem uma transformação de datum, ajuste horizontal, ou ajuste vertical. Sistemas de coordenadas Fator de Escala-somente são criados no Trimble Survey Controller (versão 7.00 ou posterior).

Deve-se definir um sistema de coordenadas antes de efetuar um ajuste da rede. Portanto, se você tiver importado um trabalho de Fator de Escala-somente do Trimble Survey Controller em um sistema de coordenadas do projeto padrão indefinido no Trimble Geomatics Office, o software lhe pedirá que atualize a projeção padrão indefinida.

No diálogo que aparece, será necessário inserir uma latitude e longitude para a origem da projeção, e coordenadas de norte falso e leste falso.


Parâmetros de Rotação da Terra

Se linhas de base com mais de 100 km. forem processadas, o processador de linha de base usa os parâmetros de rotação da terra para modelar as marés do pólo.

Estes parâmetros de rotação da terra, particularmente as coordenadas do pólo, são disponíveis cada semana como arquivos .erp de organizações tais como o Serviço Internacional de GPS (IGS). Se uma arquivo .erp para o tempo da linha de base não estiver disponível, são usadas coordenadas de pólo previstas.

Use o Windows Explorer para copiar todos os arquivos .erp relevantes para a pasta Arquivos de dados\Efeméride precisa, sob a pasta do projeto. O processador da linha de base procura nela automaticamente aqueles arquivos quando eles são requeridos. Se eles não forem encontrados, usa os valores previstos.

NOTA: Se você usar um arquivo .erp em mais de um projeto, deve-se copiar aquele arquivo em cada um dos projetos.


Rede Geodésica de Alta Precisão

Os arquivos de Grid do Datum HPGN (Rede Geodésica de Alta Precisão) para os sistemas do Plano Estado US são fornecidos como parte da instalação do sistema Trimble Geomatics Office. Os arquivos de Grid do Datum são armazenados na pasta GeoData sob a pasta de Arquivos Comuns da Trimble (geralmente Arquivos do Programa\Arquivos Comuns\Trimble\GeoData). Arquivos de Datum HPGN não são disponíveis para todos os estados americanos.

O arquivo de grid que nomeia convenção para os arquivos é:

  O identificador estado de dois caracteres + hpgn + la (latitude) ou lo (longitude), com a extensão de arquivo .dgf. Por exemplo, os arquivos de grid HPGN da Califórnia são Cahpgnla.dgf e Cahpgnlo.dgf.

Como o gerenciador do sistema de coordenadas do Trimble Geomatics Office está baseado no elipsóide WGS-84, os grids de datum HPGN (especificados para convenção bi-direcional entre NAD83 (1986) e NAD83 (HPGN)) não condizem bem com este modelo de sistema de coordenadas. Por essa razão e para evitar confusão, o software não fornece definições predefinidas do sistema de coordenadas para referenciar estes grids do datum.

Pode-se especificar suas próprias definições de datum e sistema de coordenada usando os arquivos apropriados de Grid de Datum HPGN na utilidade Gerenciador do Sistema de Coordenadas.

Para fazê-lo:

1.	Crie uma nova definição de datum que referencie os arquivos apropriados de Grid do Datum HPGN para o estado.

2.	Crie uma nova definição do sistema de coordenadas usando os parâmetros de projeção apropriados do Plano de Estado e referenciando a definição de datum apenas criada.

Use a nova definição do sistema de coordenadas num projeto do Trimble Geomatics Office para obter valores de latitude e longitude NAD-83 (1986) de coordenadas conhecidas de projeção HPGN; ou valores de latitude, longitude e altura.

Proceda da seguinte maneira:

1.	Insira os valores HPGN como coordenadas do grid; ou valores de latitude, longitude e altura locais, como apropriado.

2.	Leia os valores equivalentes de latitude e longitude NAD-83 (1986) a partir dos campos WGS-84 exibidos.

Obtenha valores HPGN de valores conhecidos de latitude, longitude e altura do NAD-83 (1986), como no seguinte:

1.	Insira os valores conhecidos de latitude, longitude e altura de NAD-83 (1986), como valores WGS-84.

2.	Leia as coordenadas de grid HPGN equivalentes; ou valores de latitude, longitude e altura dos campos grid ou local, respectivamente.


Sistema de Coordenadas de New Brunswick (Canadá)

O banco de dados do sistema de coordenadas agora possui a projeção Dupla Estereográfica e o elipsóide do Sistema Médio Terrestre de 1977 (ATS77). Para configurar o sistema de coordenadas de New Brunswick, você deve comprar o grid de datum e o modelo geóide do Levantamento Geodésico Canadense.

O sistema de coordenadas de New Brunswick (Canadá) usa:

  Elipsóide: ATS77

  Datum: Grid do datum NTv2

  Geóide: HT101

  Projeção: Dupla estereográfica:

– Latitude Central: 46° 30' 00" N

– Longitude Central: 66° 30' 00" W

– Norte Falso: 800 000 m

– Leste Falso: 300 000 m

– Fator de escala: 0.999912

Para criar o sistema de coordenadas de New Brunswick (Canadá):

1.	Use o utilitário Grid Factory para criar arquivos de Grid do Geóide (*.ggf) do modelo geóide HT101 comprado do Levantamento Geodésico do Canadá.

2.	Use o utilitário Grid Factory para criar arquivos do Grid do Datum (*lat.dgf, *lon.dgf) do grid do datum NTv2 comprado do Levantamento Geodésico do Canadá. Para maiores informações, consulte a Ajuda do utilitário Grid Factory.

3.	Use o utilitário Coordinate System Manager para adicionar um novo sistema de coordenadas. Para maiores informações, consulte o tópico Comando Adicionar Sistema de Coordenadas na Ajuda do utilitário Coordinate System Manager.


Glossário

Este glossário define os termos específicos do GPS e do software Trimble Geomatics Office. Ele não encerra a terminologia da Microsoft Windows ou de computador em geral.

Symbols

1-sigma

A

AASHTO

ajuste

ajuste da rede

ajuste livre

ajuste vertical

algoritmo

almanaque

altura da antena

altura do delta

altura do elipsóide

altura ortométrica

ambigüidade

ambigüidade do inteiro

anotação

ângulo do mapeamento

APC

arquivo da Biblioteca de Características e Atributos (*.fcl)

achatamento

achatamento inverso

atraso do zênite

azimute

azimute da seção normal

azimute geodésico

B

baud

bidimensional

busca do inteiro

C

calibração do local

camadas

Centrado na Terra Fixo na Terra (ECEF)

centro da fase

Cinemática em tempo real

CMR

código

Código de Aquisição Não Processada (C/A)

Código P

Código Y

códigos de característica

códigos do campo

componente

constelação

Contra táticas equívocas (AS – Anti-Spoofing)

convergência do ajuste

conversão do grid

Coordenadas cartesianas

coordenadas da calibração

Coordenadas do State Plane

coordenadas fixas

coordenadas geodésicas locais

coordenadas geográficas

coordenadas retangulares

correção de fase da antena

correção tropo

correlatado

Corte PDOP

covariância

critério do tau

curva normal de distribuição

D

dados GPS não processados

dados estranhos

datum

datum do ajuste

datum do projeto

datum geodésico

de-correlatar

defeito do datum

delta N, delta L, delta U

delta X, delta Y, delta Z

desconhecidos

desenho do céu

desvio da vertical

diferenciamento duplo

Disponibilidade Seletiva (S/A)

distância do elipsóide

distância do grid

distância do solo

distância do declive

distância horizontal

distribuição da freqüência

DOP

DTM

E

Efeito de Doppler

efeméride

efeméride precisa

eixo maior

eixo menor

eixo semimaior

eixo semimenor

elevação

elevação do delta

elipse do erro

elipsóide

elipsóide local

entidades

época

erro

erro de configuração

erro padrão

erro padrão do peso da unidade

erros a posteriori

erros a priori

erro de centragem do tribrach

erro propagado

erros relativos

erros sistemáticos

escala

escalar

estação base

estação de referência

estático (levantamento)

Estilos CAD

estilos do ajuste

estimativa do componente da variância

estratégia de pesagem

etiqueta

eventos

F

FastStatic

fator de referência

fechamento

fechamento do circuito

fixo

freqüência dupla

freqüência única

G

GDOP

geometria dos satélites

geóide

geomáticas

GPS

graus de liberdade

grid

grupo do componente da variância

grupo do parâmetro de transformação

H

haste de medição de altura

HDOP

HI

histograma

horário GPS

horizonte geodésico local

I

independente

índice

inicialização do ponto conhecido

intervalo da época

ionosfera

iteração

J

K

L

L1

L2

leste

levantamento cinemático

linha de base

linha de base do GPS

linha estreita

linha larga

linhas de base redundantes

livre de iono

local calibrado

M

máscara de elevação

Máscara PDOP

matriz da covariância

matriz de covariância da variância

mensagem de dados

meridiano rotado

método de busca OTF

modelação

modelo do geóide

modelo estocástico

modelo ionosférico

modelo tropo

modelos do centro da fase

N

NAVDATA

nível de confidência

nível de significância

nível médio do mar

NMEA

normal

norte

número da redundância

O

observação convencional

observação do geóide

observação redundante

observação terrestre

observações

observações de levantamento

observações do GPS

offset do relógio

origem

P

parâmetro

parâmetros de transformação

paridade

passagem lateral

PDOP

perfil reduzido da coluna

Pés de levantamento americanos

pesagem escalar

peso

pesos

ponto de controle

ponto de controle horizontal

ponto de controle vertical

pós-processo

posição horizontal

posicionamento autônomo

posicionamento diferencial

posições do ponto

PPM

PRN

precisão

precisão

probabilidade

processador de linha de base

projeção

projeção do mapeamento

projeto

prumagem

Q

quadrados mínimos

quadro da referência

R

rastreamento

RDOP

rede

rede estática

Registro de CQ

registro de dados

residual da observação

restrito

restrição

restrições internas

restrito minimamente

redundância

residual

RINEX

RMS

rotação

rover

RTCM

RTK

S

salto de ciclo

SDMS

separação do geóide

sessão

sinais refletidos

sinal algébrico

sistema de coordenadas

símbolos e tipos de linhas

solução final

solução fixa

solução flutuante

sigma

SNR

status

status da rede

sub-rede

super determinado

Super-trak

SV

T

tau (valor)

TDOP

tempo de ocupação

teste de chi quadrado

teste de Qualidade de Aprovação

tipos de solução

totalmente restrito

TOW

transformação

transformação do datum

tribrach

U

univariante

URA

US National

UTC

V

valor provável

valores ajustados

valores covariantes

variância

variância de referência

VDOP

vertical

vetor

visualização atual

W

wave

WGS-84

X

X, Y e Z

Y

Z


Sigma

Um erro padrão do médio.


erros a posteriori

Erros a priori multiplicados pelo erro padrão do peso da unidade (fator de referência) resultantes de um ajuste da rede.


erro a priori

Erros estimados para observações anteriores a um ajuste da rede.


AASHTO

American Association of State Highway and Transportation Officials (A Associação Americana dos Oficiais das Rodovias Federais e do Transporte).


precisão

A proximidade de uma medição ao valor real (verdadeiro) da quantidade que está sendo medida.


valores ajustados

Um valor derivado de dados observados (medição) através da aplicação de um processo de eliminação de erros naqueles dados num ajuste de rede.


ajuste

O processo para determinar e aplicar correções a observações para reduzir erros num ajuste de rede.


convergência do ajuste

Quando o ajuste da rede está dentro da tolerância residual definida ou última tolerância residual do rego dentro de um número definido de iterações.


datum do ajuste

O datum usado na atual iteração do ajuste da rede. O software Trimble Geomatics Office lhe permite selecionar entre o datum do projeto ou o WGS-84.


estilos do ajuste

Configurações padrões da Trimble e as definidas pelo usuário para um ajuste da rede.


sinal algébrico

O sinal (+ ou -) associado com um valor que designa-o como número positivo ou negativo.


algoritmo

Um grupo de normas para a solução de problemas em um número finito de passos.


almanaque

Dados, transmitidos por um satélite GPS que incluem informações sobre a órbita sobre todos os satélites, correção do relógio e parâmetros do atraso atmosférico.

O almanaque facilita uma rápida aquisição de SV. As informações sobre a órbita formam um sub-grupo dos dados de efemérides com precisão reduzida.


ambigüidade

O número inteiro desconhecido dos ciclos da fase portadora reconstruida contida num grupo completo de medições. O receptor conta as ondas do rádio (do satélite, na medida que elas passam a antena) com um alto nível de precisão. No entanto, ele não possui informações sobre o número de ondas ao satélite no momento em que começou a contar. Este número desconhecido de comprimentos de ondas entre o satélite e a antena, então, é a ambigüidade. Também conhecida como ambigüidade do inteiro ou distorção do inteiro.


anotação

Um pedaço de texto que descreve outro registro do banco de dados. Para selecionar e editar anotações, use a janela Propriedades.

Uma anotação é ativa—todos os campos mudam de tamanho toda vez que uma entidade pai muda.


altura da antena

A altura de um centro de fase da antena GPS acima do ponto sendo observado.

A altura não correta da antena é medida a partir do ponto observado para um ponto designado na antena e então corrigido para o vertical verdadeiro manualmente ou automaticamente no software.


correção de fase da antena

O centro de fase para uma antena GPS não é um ponto físico ou estável. O centro de fase para uma antena GPS muda em relação à direção instável do sinal que chega de um satélite. A maioria da variação do centro da fase depende da elevação do satélite. A modelagem desta variação no local do centro fase da antena permite o uso de uma variedade de tipos de antena num só levantamento. Correções do centro de fase da antena não são tão críticas quando duas antenas iguais são usadas pois erros comuns são cancelados.


Contra táticas equívocas (AS - Anti-Spoofing)

Uma característica que permite ao Departamento de Defesa dos Estados Unidos transmitir um código Y criptografado no lugar do código P. O código Y tem por finalidade ser útil somente aos usuários autorizados (principalmente militares). AS é utilizado com a Disponibilidade Seletiva para negar a precisão total do GPS a usuários civis.


APC

É a abreviação de “Antenna Phase Center”, o Centro de Fase da Antena

O centro eletrônico da antena. Ele geralmente não corresponde ao centro físico da antena. O sinal de rádio é medido no APC.

Na janela Propriedades, a altura de um ponto pode ser a elevação do APC. Se a altura estiver especificada como APC, é a altura do APC—não da altura do solo.


posicionamento autônomo

Um modo de operação no qual um receptor GPS computa fixos de posição em tempo real somente a partir de dados de satélite, sem referência a dados fornecidos por uma estação de base. O posicionamento autônomo é o procedimento de posicionamento menos preciso que um receptor GPS pode efetuar, produzindo fixos de posições precisos para a raiz quadrada média horizontal de ±100 metros quando a Disponibilidade Seletiva está em efeito e de ±10--20 metros quando não está. Também conhecido como posicionamento absoluto e posicionamento do ponto.


azimute

Uma observação de levantamento usada para medir o ângulo formado por uma linha de base horizontal e norte geodésico. Quando aplicada a observações GPS, refere-se a um azimute da seção normal.


estação base

Uma antena e um receptor instalados num local conhecido. Ela é usada levantamento cinemáticos em tempo real (RTK) ou diferenciais. Os dados podem ser registrados na estação base para posterior pós-processamento. Uma estação de referência da Trimble, tal como o software Trimble Reference Station (TRS), ou o software Trimble Universal Reference Station (URS) e um receptor no modo estação base são exemplos de estações base.

Na prática de levantamento GPS, observam-se e computam-se linhas de base (isto é, a posição de um receptor em relação a outro). A estação base atua como uma posição da qual todas as outras posições desconhecidas são derivadas.


linha de base

A posição de um ponto em relação a outro ponto. Em levantamento GPS, é a posição de um receptor em relação a outro. Quando os dados destes dois receptores são combinados, o resultado é uma linha de base que possui um vetor tridimensional entre as duas estações.


processador de linha de base

Um programa de computador que computa soluções de linha de base a partir de medições de satélite. Ele pode ser executado como um pós-processador num computador pessoal ou como um processador em tempo real num receptor. O WAVE (“Weighted Ambiguity Vector Estimator” – Avaliador do Vetor de Ambigüidade Ponderada) é o processador de linha de base da Trimble.


baud

Uma unidade de velocidade de transferência de dados (de um aparelho digital binário a outro) usado quando se descrevem comunicações seriais.


bidimensional

Função matemática que descreve o comportamento de erros aleatórios bidimensionais em elipses de erro para:

  norte/leste

  latitude/longitude

  X/Y


Estilos CAD

Estilos CAD definem a aparência dos pontos, linhas, arcos, curvas, texto e anotações de um projeto. Um estilo, por exemplo, pode ser feito de um símbolo, linha, tipo, cor ou fonte. Definições de estilo são armazenadas em um projeto.

Para que estilos sejam disponíveis para uma série de projetos, defina os estilos num projeto gabarito.


local calibrado

Uma definição de local usa uma definição existente do sistema de coordenadas mais uma transformação da correção. Isto faz com que seja o mais adequado para dados GPS numa área específica (ou local).

As transformações extras de correção são requeridas porque um sistema de coordenadas é projetado para ser aplicado sobre uma área muito vasta. Ele não permite variações nas coordenadas locais.

É necessário possuir que o novo trabalho se ajuste com o controle existente para que as transformações extra de correção corrijam estas variações locais. Estas correções extras somente são válidas numa área limitada. Isso explica o significado do termo ‘local’.

O software Trimble Geomatics Office pode computar as transformações extras requeridas para condizerem com o controle local e salvar estas definições no banco de dados do sistema de coordenadas.


coordenadas da calibração

As coordenadas WGS-84 (latitude/longitude/altura do elipsóide) geradas de um ajuste de rede minimamente restrito da sua observação GPS e salvadas para uso posterior numa calibração de local GPS.

As coordenadas da calibração são usadas como as coordenadas GPS observadas que são associadas com as coordenadas do grid de um ponto determinado quando se efetua a calibração.


Coordenadas cartesianas

Ver Centrado na Terra Fixo na Terra (ECEF).


teste de chi quadrado

Um teste geral estatístico do ajuste da rede. É um teste da soma dos quadrados do cargo dos residuais, o número de graus de liberdade e uma probabilidade crítica de 95 por cento ou mais.

A finalidade deste teste é rejeitar ou aceitar a hipótese que os erros preditos foram estimados com precisão.


offset do relógio

A diferença constante na leitura da hora entre dois relógios. Em GPS, geralmente refere-se ao offset entre relógios de satélites e o relógio no receptor do usuário.


fechamento

Acordo entre partes medidas e conhecidas de uma rede.


CMR

Abreviação de “Compact Measurement Record” (Registro de Medição Compacta)

Um mensagem de medição emitida por satélite que é transmitida pelo receptor da base e usado por levantamentos em cinemática em tempo real (RTK) para calcular um vetor preciso de linha de base da base até o rover.


Código de Aquisição Não Processada (C/A)

Um código de ruído pseudo-aleatório (PRN) modulado num sinal de L1. Este código ajuda ao receptor computar a distância do satélite.


código

O código GPS é um código de ruído pseudo-aleatório (PRN), modulado em sinais portadores de GPS.

O Código C/A não está classificado é está à disposição para uso em aplicações civis.

O Código P é também conhecido e não está classificado, mas pode ser criptografado para fins de defesa nacional.

Medições de código são as bases para navegação e posicionamento GPS. Código é também usado em conjunto com medições de fase portadora para obter soluções mais precisas de linha de base de qualidade em levantamentos.


componente

Um de três observações de levantamento usado para definir uma linha de base tridimensional entre dois pontos de controle. A mesma linha de base pode ser definida por azimute, altura do delta e distância (em coordenadas do elisóide); por delta X, delta Y e delta Z em (coordenadas cartesianas Centradas na Terra); e por delta norte, delta leste e delta para cima (em coordenadas do plano local).


constelação

Um grupo específico de satélites usado para o cálculo de posições; três satélites para fixos bidimensionais, quatro satélites para fixos tridimensionais.

Todos satélites visíveis a um receptor GPS num dado momento. As constelação ideal é a constelação com a PDOP mais baixo. Ver também PDOP.


restrito

Para manter (fixa) uma quantidade (observação e coordenada) como verdadeira num ajuste de rede.


restrição

Limitações externas impostas às quantidades ajustáveis (observações e coordenadas) num ajuste de rede.


ponto de controle

Um ponto em monumento no qual as coordenadas estiveram ou estão no processo para estarem, designado pelo uso de observações de levantamento.


observação convencional

Uma observação no campo obtida com o uso de uma estação total ou teodolito.


sistema de coordenadas

Um grupo de transformações que permitem às posições GPS (no elipsóide WGS-84) serem transformadas em coordenadas da projeção com elevações acima do Geóide.

Ele consiste de uma transformação do datum, uma designação do modelo geóide e uma definição da projeção de coordenadas.

A transformação do datum é definida no banco de dados do sistema de coordenadas. Ela inclui a definição do datum sobre o qual está baseada a projeção de coordenadas.

Um modelo geóide existente pode ser designado ao sistema de coordenadas, mas também é possível especificar uma separação geoidal constante ao invés de usar um modelo geóide. Use a utilidade Gerenciador do Sistema de Coordenadas da Trimble™ para definir modelos geóides no banco de dados do sistema de coordenadas.

Pode-se designar alguns tipos de projeção de coordenadas a um sistema de coordenadas (por exemplo, Transverse Mercator ou Paralelo Um de Lambert). Diferentes países e regiões usam diferentes tipos de projeções para conseguir resultados ideais (isto é, com distorção mínima) nas coordenadas da projeção. Os métodos de projeção das coordenadas projetam valores de latitude e longitude no datum apropriado para valores de coordenadas cartesianos. As elevações para as coordenadas da projeção são alcançadas através do uso do modelo geóide designado ao sistema de coordenadas.

A utilidade Gerenciador do Sistema de Coordenadas da Trimble lhe permite visualizar, editar e adicionar definições ao sistema de coordenadas fornecidas com o software Trimble Geomatics Office.


correlatado

Diz-se de duas ou mais informações (ou quantidades derivadas) que possuem ao menos uma fonte comum de erro.


covariância

Uma medida da correlação de erros entre duas observações ou quantidades derivadas. Também refere-se a um termo que sai da diagonal (isto é, não uma variância) numa matriz variância-covariância.


matriz da covariância

Uma matriz que define a variância e a covariância de uma observação. Os elementos da diagonal são a variância e todos os elementos de qualquer um dos lados da diagonal são a covariância.


valores covariantes

Como usados pelo software Trimble Geomatics Office, esta é a publicação dos erros a posteriori propagados (computados) em azimute, distância e altura entre pares de controle resultantes de um ajuste de rede. O termo covariante indica que esta computação envolve o uso de termos covariantes na matriz variância-covariância de pontos de controle ajustados.


visualização atual

Pode-se abrir mais de uma visualização no banco de dados através do comando Janela / Nova Janela. Cada uma destas visualizações podem ter diferentes configurações de visualização. A visualização atual é a visualização que possui o foco e isso é identificado pelo uso da barra do título ativada.


salto do ciclo

Uma interrupção no bloqueio do receptor para os sinais de rádio do satélite. Um salto do ciclo requer uma nova estimativa de termos de ambigüidade dos números inteiros durante o processamento da linha de base.


registro de dados

O processo de registro de dados de satélite em um arquivo armazenado no receptor, um coletor de dados que esteja executando o software Trimble Survey Controller ou num PC card.


mensagem de dados

Uma mensagem, incluída no sinal GPS, que relata sobre a localização e condições dos satélites, como também qualquer eventual correção de relógio. Ela inclui informações sobre as condições de outros satélites como também as suas posições aproximadas.


datum

Um modelo matemático da terra desenhado para conter parte do ou todo o geóide. Ele é definido pela relação entre um elipsóide e um ponto da superfície topográfica estabelecida como a origem do datum. Geralmente é conhecido como um datum geodésico.

O tamanho e forma de um elipsóide e o local do centro do elipsóide em relação ao centro da terra, geralmente define os datums geodésicos do mundo.


defeito do datum

Diferenças entre dois grupos de coordenadas que podem somente ser retificadas através do uso de uma transformação de um datum como parte de um ajuste da rede.


transformação do datum

Define a transformação que é usada para transformar as coordenadas de um ponto definido em um datum para coordenadas em um datum diferente.

Existe uma série de diferentes métodos de transformação de datums suportados pelo software Trimble Geomatics Office:

  Sete-Parâmetros

  Três-Parâmetros (também conhecido como Molodensky)

  Grid do Datum

  Regressão Múltipla

Transformações do datum geralmente convertem dados coletados no datum WGS-84, através de métodos GPS, em datums usados para fins de levantamentos ou mapeamentos em regiões individuais e países.


de-correlatar

Para remover as entre observações da covariância. Isso pode ser feito através de transformações ortogonais elaboradas, ou através da computação de ajustes horizontal e vertical separados.


desvio da vertical

A diferença angular, entre a direção para cima da linha de prumagem (vertical) e a perpendicular (normal) à elipsóide.


graus de liberdade

Uma medida da redundância em uma rede.


elevação do delta

A diferença em elevação entre dois pontos.


altura do delta

O componente vertical na expressão de linhas de base GPS do software Trimble Geomatics Office. É a diferença em altura ou mudança de altura.


delta N, delta L, delta U

Diferenças de coordenadas expressadas num sistema de coordenadas do Horizonte Geodésico Local.


delta X, delta Y, delta Z

Diferenças de coordenadas expressadas em um sistema de coordenadas cartesiano.


posicionamento diferencial

A medição precisa da posição relativa de dois receptores que estão rastreando os mesmos satélites simultaneamente.


DOP

Abreviação de “Dilution of Precision” - Diluição da Precisão

Um indicador da qualidade de uma posição GPS. Ela considera cada posicionamento de satélite em relação aos outros satélites na constelação e as suas geometrias em relação ao receptor GPS. Um valor DOP baixo indica uma alta probabilidade de precisão. DOPs padrões para aplicações GPS são:

  Posição PDOP (três coordenadas)

  HDOP Horizontal (duas coordenadas horizontais)

  RDOP

  VDOP Vertical (somente altura)

  Hora TDOP (somente offset de relógio)


Efeito de Doppler

A mudança aparente em freqüência de um sinal causado pela moção relativa de satélites e receptor.


diferenciamento duplo

Um método aritmético de diferenciamento de fases portadoras simultaneamente medidas por dois receptores que rastreiam os mesmos satélites. Este método remove os erros de satélite e do relógio do receptor.


DTM

Digital Terrain Model (Modelo Digital do Terreno)

Uma representação eletrônica tridimensional do terreno.


freqüência dupla

Um tipo de receptor que usa tanto o sinal L1 como o L2 de satélites GPS. Um receptor de dupla freqüência pode computar fixos mais precisos de posições através de longas distâncias e sob condições mais adversas porque compensa os atrasos ionosféricos.


Centrado na Terra Fixo na Terra

Um sistema cartesiano de coordenadas usado pelo quadro de referência WGS-84. Neste sistema de coordenadas, o centro do sistema está no centro de massa da terra. O eixo z é coincidente com o eixo rotacional médio da terra e o eixo x passa através do 0° N e 0° E. O eixo y é perpendicular ao plano dos eixos x e z.


leste

Leitura em direção ao leste dos valores do grid. Esquerda para a direita num grid (eixo X).


elevação

A altura acima do nível médio do mar ou a distância vertical acima do geóide. A elevação é algumas vezes conhecida como a altura ortométrica.


máscara de elevação

Um ângulo que normalmente é especificado para 13 graus. Se satélites forem rastreiados acima deste ângulo, evita-se a interferência causada por prédios, árvores e erros de sinais refletidos.

A Trimble recomenda que não se rastreiem satélites que estejam abaixo de 13 graus.


elipsóide

Um modelo matemático da terra formado através da rotação de uma elipse ao redor do seu eixo menor. Para elipsóides que modelam a terra, o eixo menor é o eixo polar e o eixo maior é o eixo equatorial.

Define-se um elipsóide através da especificação dos comprimentos de ambos os eixos, ou através da especificação do comprimento do eixo maior e o achatamento.

Duas quantidades definem um elipsóide; estes são geralmente dados como

o comprimento do eixo semimaior, a, e

o achatamento, [image], onde b é o comprimento do eixo semimaior.


distância do elipsóide

Como usado no software Trimble Geomatics Office, é o comprimento da seção normal entre dois pontos.

CUIDADO: A distância do elipsóide não é a mesma da distância geodésica.


altura do elipsóide

A distância, medida ao longo do normal, a partir da superfície do elipsóide para um ponto.


entidades

Elementos gráficos primários que podem ser visualizados e selecionados da janela de gráficos.

Entidades disponíveis no software Trimble Geomatics Office são pontos, linhas, arcos, texto e anotações.


efeméride

Um grupo de dados que descreve a posição de um objeto celeste como uma função do tempo. Cada satélite GPS transmite periodicamente uma efeméride de transmissão que descreve as suas posições preditas num futuro próximo, carregado pelo Segmento de Controle. Programas de pós-processamento também podem usar uma efeméride precisa que descreve as posições exatas de um satélite no passado.


época

O intervalo de medição de um receptor GPS. A época varia de acordo com o tipo de levantamento:

  para levantamentos em tempo real é configurado para um segundo

  para levantamentos pós-processados ele pode ser configurado para um índice de entre um segundo e um minuto


intervalo da época

O intervalo de medição usado por um receptor GPS, também chamado ciclo.


erro

A diferença entre o valor medido de uma quantidade e o seu valor verdadeiro. Erros de levantamento são geralmente divididos em três categorias: equívocos, erros sistemáticos e erros aleatórios. A análise de quadrados mínimos é utilizada para detectar e eliminar equívocos e erros sistemáticos e o ajuste de quadrados mínimos é usado para medir e distribuir apropriadamente o erro aleatório.


elipse do erro

Uma elipse do erro de coordenada é uma representação gráfica da magnitude e direção do erro de pontos ajustados da rede.


eventos

Um registro da ocorrência de um evento, tal como o fechamento do diafragma de uma câmera fotogramétrica. Um receptor GPS pode registrar  uma marca de evento que contenha o horário do evento e um comentário alfanumérico inserido através do teclado para descrever o evento. Um evento pode ser desencadeado através do teclado ou através de uma entrada de sinal elétrico numa das portas do receptor.


FastStatic

Um método de levantamento GPS que usa ocupações de até 20 minutos para coletar dados GPS não processados e depois os pós-processa para obter precisões sub-centimétricas. Tipicamente os tempos de ocupação variam dependendo do número de satélites (SVs) em vista:

  4 SVs levam 20 minutos*

  5 SVs levam 15 minutos*

  6 ou mais SVs levam 8 minutos*

(*coletados num índice de época de 15 segundos)


Arquivo da Biblioteca de Características e Atributos (*.fcl)

Um arquivo de textos que contém as definições de códigos de característica, atributos, estilos CAD e códigos de controle.


códigos de característica

Palavras descritivas ou abreviações que descrevem as características que se vêem.


códigos de campo

Instruções especiais que dizem ao software Trimble Geomatics Office que insira as informações em relatórios, arquivos e anotações.

Códigos de campo são usados para lidar com a transferência de dados do banco de dados em operações de importação/exportação/relatório de ASCII.


solução final

Quando se usa pós-processamento para gerar vetores GPS, particularmente para soluções estáticas, o processador da linha de base passa por diferentes soluções usando uma variedade de técnicas de processamento e combinações de medições GPS. Em geral, cada solução subseqüente é melhor que a anterior. A solução final fornece a melhor estimativa do vetor GPS entre dois pontos.


fixo

Ver resrito.


coordenadas fixas

Coordenadas de ponto que não se movem quando se efetua um ajuste de rede.


solução fixa

Uma solução obtida quando o processador da linha de base é capaz de resolver a busca da ambigüidade do número inteiro com suficiente confidência para selecionar um grupo de números inteiros ao invés de outro. É chamado solução fixa porque as ambigüidades são todas fixas dos seus valores flutuantes estimados para os seus valores inteiros apropriados.


achatamento

Uma expressão matemática dos comprimentos relativos dos eixos maior e menor de um elipsóide.


achatamento inverso

Uma expressão do achatamento que é mais fácil de ler e editar.


solução flutuante

Uma solução obtida quando o processador da linha de base não é capaz de resolver a busca ambigüidade do número inteiro com suficiente confidência para selecionar um grupo de números inteiros ao invés de outro. É chamado solução flutuante porque a ambigüidade inclui uma parte fracionária e não é inteira.


ajuste livre

Efetuação de um ajuste de rede no qual nenhum ponto (coordenada) é restrito. O ajuste de rede usa restrições internas.


distribuição da freqüência

O tamanho e difusão de residuais em um grupo de dados. Mostrado graficamente em histogramas.


totalmente restrito

Um ajuste de rede na qual todos os pontos que fazem partes de uma rede de controle maior são mantidos fixos nos seus valores de coordenadas publicados. Usado para amalgamar redes de controle menores com maiores e redes velhas com redes novas.


GDOP

Geometric Dilution of Precision (Diluição da Precisão Geométrica)

O relacionamento entre erros na posição e horário do usuário e os erros na alcance dos satélite. Ver também DOP.


azimute geodésico

O ângulo entre o meridiano geodésico e a tangente à linha geodésica do observador, medido na perpendicular plana ao elipsóide normal ao observador. Sentido horário a partir do norte.


datum geodésico

Um elipsóide que mais se aproxima do geóide.

O tamanho e a forma de um elipsóide e o local do centro do elipsóide em relação ao centro da terra define os datums geodésicos do mundo.

Vários datums foram estabelecidos para condizer com determinadas regiões. Por exemplo, mapas europeus com freqüência são baseados no datum europeu de 1950 (ED-50). Mapas dos Estados Unidos são geralmente baseados no Datum Norte Americano de 1927 ou 1983 (NAD-27, NAD-83). Todas as coordenadas GPS são baseadas na superfície do datum WGS-84.


coordenadas geográficas (geodésicas)

Latitude, longitude e altura do elipsóide.


geóide

A superfície do eqüipotencial gravitacional que se aproxima de perto o nível médio do mar. Não tem uma forma matemática uniforme mas é uma figura irregular com uma forma geral parecida com um elipsóide.

Geralmente, as elevações de pontos são medidas com referência ao geóide. No entanto, pontos fixos por métodos GPS possuem as alturas estabelecidas no datum WGS-84 (uma figura matemática).

O relacionamento entre o datum WGS-84 e o geóide deve ser determinado pela observação, pois não existe uma só definição matemática que possa descrever o relacionamento. Deve-se usar métodos convencionais de levantamento para observar a elevação acima do geóide e então comparar os resultados com a altura acima do elipsóide WGS-84 no mesmo ponto.

A coleção de um grande número de observações da separação entre o geóide e o datum WGS-84 (separação geoidal), arquivos de grid dos valores de separação podem ser estabelecidos. Isso permite a interpolação da separação geoidal em posições intermediárias. Arquivos que contêm estes grids de separação geoidal são tidos como modelos do geóide. Considerando que uma posição WGS-84 caia dentro do perímetro de um modelo do geóide, o modelo pode voltar a separação geoidal interpolada nesta posição.


modelo geóide

Uma representação matemática do geóide para uma área específica ou para toda a terra. O software usa o modelo do geóide para gerar separações do geóide para os seus pontos na rede.


observação do geóide

É uma separação do geóide, com o seu erro associado, extraída de um modelo do geóide. O ajuste de rede do software Trimble Geomatics Office trata-os do mesmo modo que qualquer observação com um erro associado. Na medida que o ajuste progride, as observações tornam-se observações ajustadas do geóide.


separação do geóide

A distância entre o elipsóide e o geóide num ponto determinado.


geomáticas

É o desenho, coleta, armazenamento, análise, apresentação e a recuperação de informações espaciais. A coleta de informações espaciais pode ser de uma variedade de fontes, incluindo métodos GPS e terrestres. Geomáticas integram o levantamento tradicional com métodos que utilizam tecnologia moderna, tornando as geomáticas úteis para um grande número de aplicações.


GPS

Global Positioning System (Sistema de Posicionamento Global)

O GPS é baseado numa constelação de vinte e quatro (24) satélites que orbitam a terra num altitude muito alta.


linha de base do GPS

Uma medição tridimensional entre um par de estações para as quais dados GPS simultâneos foram coletados e processados com técnicas diferentes.

Representada como delta X, delta Y e delta Z; ou azimute, distância e altura do delta.


Observações do GPS

Uma linha de base do GPS com os seus erros associados. Na medida que o ajuste progride, as observações tornam-se observações GPS ajustadas.


Dados GPS não processados

Os dados coletados por um receptor GPS para serem processados mais tarde. Podem ser na forma de um arquivo .dat (formato de arquivo de dados da Trimble) ou um arquivo RINEX.


Horário GPS

Uma medida de tempo usada pelo sistema NAVSTAR GPS. O horário GPS está baseado na Coordenada da Hora Universal (UTC) mas não adiciona ‘segundos intercalares’ periódicos para corrigir as mudanças no período de rotação da terra.


grid

Um sistema de coordenadas retangular horizontal bidimensional, tal como uma projeção de mapa.


conversão do grid

A conversão entre as coordenadas de projeção geográfica e do mapa.


distância do grid

A distância entre dois pontos que é expressa em coordenadas de projeção do mapa.


distância do solo

A distância (distância horizontal com curvatura aplicada) entre dois pontos do solo.


HDOP

Horizontal Dilution of Precision (Diluição da Precisão Horizontal)


haste de medição de altura

Uma ferramenta de medição fornecida com uma antena GPS externa e usada para medições da altura da antena acima de um ponto.


HI

Height of instrument (Altura de Instrumento).

Sinônimo de alturas de antena para GPS.


histograma

Uma apresentação gráfica do tamanho e distribuição de residuais num ajuste de rede.


ponto de controle horizontal

Um ponto com precisão somente na coordenada horizontal. A elevação ou altura do elipsóide é uma ordem inferior de precisão ou é desconhecida.


distância horizontal

A distância entre dois pontos, computada horizontalmente a partir da elevação de qualquer um dos pontos.


posição horizontal

Um ponto com somente coordenadas horizontais.


independente

Redes subdivididas, observações e pontos de controle que não estão conectados por geometria ou erros. Este termo tem um significado oposto de correlacionado.


restrições internas

Um ajuste de rede computado sem a fixação de nenhuma coordenada de pontos. O software Trimble Geomatics Office usa o centróide da rede como uma restrição interna.


ambigüidade do inteiro

O número total de ciclos num pseudo-alcance de fase portadora entre o satélite GPS e o receptor GPS.


busca do inteiro

Processamento de linha de base GPS, seja ela em tempo real ou pós processada, requer soluções de inteiro fixas para os melhores resultados possíveis. O software que processa as medições GPS usadas para derivar uma linha de base efetua uma busca de inteiros para obter uma solução de inteiro fixo. A busca envolve a tentativa de várias combinações de valores inteiros e a seleção dos melhores resultados.


Solução sem ionosfera (Iono Free)

ionospheric free solution (IonoFree)

Uma solução que usa uma combinação de medições GPS para modelar e remover os efeitos da ionosfera nos sinais de GPS. Esta solução é geralmente usada para controlar o levantamento com alta ordem, particularmente quando se observam longas linhas de base.


ionosfera

A faixa de partículas carregadas de 80 a 120 milhas acima da superfície da terra. Ela afeta a precisão das medições GPS quando se medem longas linhas de base com receptores de freqüência única.


modelo ionosférico

A atraso de tempo causado pela ionosfera varia dependendo da freqüência dos sinais GPS e afeta, de forma diferente, os sinais L1 e L2. Quando receptores de freqüência dupla são usados, observações de fase portadora para ambas freqüências podem ser usadas para modelar e eliminar a maioria dos efeitos ionosféricos. Quando medições de freqüência dupla não estiverem disponíveis, pode-se usar um modelo ionosférico emitido pelos satélites GPS para reduzir os efeitos ionosféricos. No entanto, o uso do modelo de emissão não é tão eficaz como o uso de medições de freqüência dupla.


iteração

Um grupo completo de computações para ajuste que inclui a formação das equações de observações, equações normais, ajustes de coordenadas e computação de residuais.


levantamento cinemático

Um método de levantamento GPS que usa curtas ocupação Parar e Ir, enquanto mantém o bloqueio de ao menos 4 satélites. Pode ser feito em tempo real ou pós processado para alcançar precisões centimétricas.


inicialização do ponto conhecido

Ponto conhecido é utilizado em conjunto com a inicialização cinemática. Se dois pontos conhecidos são disponíveis, o processador da linha de base pode calcular um inverso entre os dois pontos e derivar um vetor de inicialização. Este vetor de inicialização, com componentes de linha de base conhecidos, é usado para ajudar resolver a ambigüidade do inteiro. Se o processador estiver habilitado para resolver com êxito esta ambigüidade, é possível uma solução fixa do inteiro, fornecendo as melhores soluções para levantamentos cinemáticos.


L1

A portadora primária de banda L usada por satélites GPS para transmitir dados de satélite. A sua freqüência é de 1575,42 MHz. Ela é modulada pelo código C/A, código P e Mensagem de Navegação.


L2

A portadora secundária da banda L usada por satélites GPS para transmitir dados de satélite. A sua freqüência é de 1227,6 MHz. Ela é modulada pelo código P e uma Mensagem de Navegação.


etiqueta

Informações que podem ser designadas a pontos do projeto. Ela aparecem ao lado de pontos, ajudando-o a sua localização com facilidade. Etiquetas são visíveis na visualização do Levantamento e na visualização do Plano.

Pode-se usar a definição predefinida da etiqueta do software Trimble Geomatics Office para marcar pontos (por exemplo, com os seus nomes, códigos de característica e elevações).

Etiquetas usam a mesma fonte e tamanho de Dicas para uso das Ferramentas das configurações da Aparência no Microsoft Windows.

Para designar etiquetas a pontos no banco de dados, use Visualizar / Etiquetas do Ponto.


camadas

Um lugar para armazenar dados que foram agrupados.

A organização de dados em camadas desta forma facilita a sua gestão. Pode-se ter um número indeterminado de camadas num projeto. Para designar ou voltar a designar uma entidade a uma camada, use a janela Propriedades. Uma camada possui até 100 caracteres alfanuméricos.


quadrados mínimos

Um método matemático para o ajuste de observações, com base na teoria da probabilidade. Neste método de ajuste, a soma de quadrados de todos os residuais ponderados é minimizada.


nível de confidência

Uma medida da confidência nos nossos resultados, expressa numa porcentagem ou sigma.


nível de significância

Uma expressão de probabilidade. Diz-se que um erro de um sigma (padrão) possui um nível de significância de 68 por cento. Para erros com uma só dimensão, um nível de 95 por cento de significância é expressado por 1,96 sigma e um nível de porcentagem é expressado por 2,576 sigma.


elipsóide local

O elipsóide especificado por um sistema de coordenadas. As coordenadas WGS-84 são primeiramente transformadas neste elipsóide e depois convertidas para coordenadas do grid.


coordenadas geodésicas locais

A latitude, longitude e altura de um ponto. As coordenadas são expressadas em termos do elipsóide local.


horizonte geodésico local

A qualquer ponto, um plano na altura do elipsóide de um determinado ponto, paralelo ao plano tangente à elipsóide naquele ponto. Valores de coordenadas para o horizonte geodésico local são expressados em Norte, Leste e Para cima. O HGL é utilizado para a rotação das diferenças da Coordenada Cartesiana EC antes do modelamento de uma linha de base no elipsóide. Valores de azimute computados dos componentes de HGL devem ser corrigidos para normais da inclinação como parte de um modelo no elipsóide.


fechamento do circuito

Fechamentos do circuito fornecem uma indicação em relação à quantidade de erro num grupo de observações dentro de uma rede.

Um fechamento do circuito é calculado através da seleção de um ponto do qual uma ou mais observações foram extraídas, adicionando uma destas observações às coordenadas do ponto e calculando as coordenadas do segundo ponto com base naquela observação. Este processo é repetido uma ou mais vezes em torno de um circuito, finalmente terminando no ponto inicial original. Se não houverem erros nas observações, a coordenada final calculada será exatamente a mesma que a coordenada  inicial original. Subtraindo a coordenada calculada da coordenada original, determina-se um fechamento equivocado. A divisão deste erro pelo comprimento da linha permite que o erro seja expressado em partes por milhão.

Esta técnica também pode ser usada entre dois pontos diferentes quando ambos pontos são conhecidos com um alto grau de precisão. Isso também é conhecido como fechamento transversal.


eixo maior

Ver elipsóide.


ângulo do mapeamento

O ângulo entre o norte do grid numa projeção do mapa e o meridiano de longitude num determinado ponto. Também conhecido como convergência.


projeção do mapeamento

Uma rigorosa expressão matemática da superfície curvada do elipsóide num grid retangular da coordenada.


nível médio do mar

A altura média da superfície do oceano para todas as etapas da maré. Usado como referência para elevações.


restrito minimamente

Um ajuste da rede no qual somente são utilizadas suficientes restrições para definir o sistema de coordenadas. Usado para medir a coerência interna em observações.


eixo menor

Ver elipsóide.


modelação

Expressado uma observação e seus erros relacionados matematicamente e geometricamente em alguns sistemas de coordenadas definidos, tal como um elipsóide.


sinais refletidos

Interferência (parecida com os ‘fantasmas’ numa tela de televisão) que acontece quando sinais GPS chegam na antena percorrendo diferentes caminhos. O sinal que percorre um caminho mais longo produz uma estimativa de pseudo alcance mais longa e aumenta o erro. Múltiplos caminhos podem surgir de reflexos de estruturas perto da antena.


linha estreita

Uma combinação linear de observações de fase portadora L1 e L2 (L1 + L2) que é útil para o cancelamento de efeitos ionosféricos em dados de linha de base coletados. O comprimento de ondas efetivo da linha estreita é de 10,7 centímetros.


NAVDATA

NAVDATA é a emissão da mensagem de navegação de 1500-bit de cada satélite. Esta mensagem contém o horário do sistema, parâmetros de correção do relógio, parâmetros do modelo de atraso ionosférico e detalhes da efeméride e condições do satélite. As informações são utilizadas para processar sinais GPS para obter a posição e velocidade do usuário.


rede

Um grupo de linhas de base. Ver também sub-rede.


ajuste da rede

A solução de equações simultâneas projetadas para alcançar o fechamento numa rede de levantamento através da minimização a soma dos quadrados ponderados dos residuais das observações.

A técnica de ajuste empregada pelo software Trimble Geomatics Office as vezes é chamada de variação de coordenadas, e algumas vezes de método de observações indiretas.


status da rede

Uma indicação de que uma determinada observação será incluída no ajuste.

 Rede quer dizer que está incluída no ajuste

 Não Rede quer dizer que está excluída no ajuste


NMEA

National Marine Electronics Association (Associação Nacional de Eletrônica Marinha)

O padrão NMEA 0183 define a interface para aparelhos eletrônicos de navegação marinha. Este padrão define uma série de ‘cadeias’ conhecidas como cadeias NMEA que contêm detalhes de navegação tais como posições.

A maioria dos receptores GPS da Trimble podem produzir posições como cadeias NMEA.


normal

Em geodésia, a linha reta perpendicular à superfície do elipsóide.


curva normal de distribuição

Uma ilustração gráfica da distribuição teorética de variáveis aleatórias em torno de um valor esperado de acordo com a teoria da probabilidade. Usada com histogramas.


azimute da seção normal

Ângulo medido do meridiano geodésico do observador para o ponto observado no elipsóide.


norte

Leitura em direção ao norte de um valor do grid.


residual da observação

A correção aplicada a uma observação, como determinado pelo ajuste.


observações

Ver observações de levantamento.


tempo de ocupação

A quantidade de tempo requerida numa estação, ou ponto, para ter êxito no processo de uma linha de base GPS. A quantidade de tempo varia dependendo da técnica de levantamento, do tipo de receptor GPS usado e da precisão requerida para os resultados finais. Tempos de ocupação podem variar de um par de segundos (levantamentos cinemáticos) para várias horas (levantamentos de controle ou deformação que requerem os mais altos níveis de precisão e repetibilidade).


origem

A interseção dos eixos num sistema de coordenadas. O ponto do início.


altura ortométrica

A distância entre um ponto e a superfície do geóide. É geralmente chamado de elevação.


método de busca OTF

Processamento da linha de base GPS, seja ela em tempo real ou pós processada, requer soluções de inteiros fixos para os melhores resultados possíveis. (ver busca do inteiro.)

Historicamente, esta busca foi efetuada com o uso de medições coletadas enquanto dois ou mais receptores estavam parados nos seus respectivos pontos. Receptores e softwares modernos podem usar as medições coletadas quando o receptor rover está em movimento. Como o receptor está se movendo, os dados são descritos como coletados ‘On-the fly’ (OTF), ‘em movimento’, e a busca do inteiro usando estes dados é portanto uma ‘busca OTF’.


dados estranhos

Uma observação identificada por análise estatística como tendo um residual demasiado grande para o seu erro estimado. O termo deriva da posição gráfica de uma observação num histograma.


super determinado

Uma rede para qual mais medições foram feitas que necessário para computar as coordenadas da rede. Relacionado à redundância.


Código P

O código ‘exato’ transmitido pelos satélites GPS. Cada satélite possui um código único que é modulado em ambas ondas de portadora L1 e L2. O código P é substituído por um código Y quando o fator ‘Contra táticas equívocas (AS – Anti-Spoofing)’ está ativado.


parâmetro

Uma variável independente em termos de quais coordenadas de pontos numa linha ou superfície são dados. Ver desconhecidos.


paridade

Uma forma de verificação de erro usada em armazenamento e transferência de dados digitais binários. As opções para a verificação de paridade incluem Par, Ímpar ou Nenhum.


PDOP

Position Dilution of Precision (Diluição da Precisão da Posição)

Uma figura de mérito sem unidade que expressa o relacionamento entre o erro na posição do usuário e o erro na posição do satélite. Geometricamente, a PDOP é proporcional a 1 dividido pelo volume da pirâmide formada por linhas que saem do receptor em direção a quatros satélites que são observados. Valores considerados ‘bons’ para o posicionamento são pequenos, por exemplo 3. Valores maiores de 7 são considerados pobres. Portanto, PDOP pequena é associada com satélites muito separados.

A PDOP é relacionada à DOP horizontal e vertical por:


Corte PDOP

Um parâmetro do receptor especificando um valor de PDOP máximo para posicionamento. Quando a orientação geométrica dos satélites fornece uma PDOP maior que o valor da máscara, o receptor pára de computar fixos de posição.


Máscara PDOP

O valor mais elevado da PDOP no qual um receptor computa posições.


centro da fase

Ver correção de fase da antena.


modelos do centro da fase

Um modelo usado para aplicar uma correção a um sinal GPS baseado num tipo específico de antena. A correção é baseada na elevação do satélite acima do horizonte e modela variações elétricas no local do centro de fase da antena. Estes modelos são úteis na eliminação de erros introduzidos quando antenas idênticas não são usadas tanto em pontos da base como rover correção de fase da antena.


prumagem

O ato de prumar a antena ou instrumento ao longo de uma linha vertical (linha do prumo) perpendicular à superfície eqüipotencial do campo de gravidade da terra.


posições do ponto

Ver posicionamento autônomo.


pós processo

Para processar dados de satélite, após a sua coleta, num computador.


PPM

Partes por milhão

Uma representação padronizada de um erro de escala em medições de distância. Um erro de 1 PPM resultaria em 1 milímetro de erro de medição para cada 1000 metros de distância de deslocamento.


efeméride precisa

Ver efeméride.


precisão

Uma mensagem de quanto perto as variáveis aleatórias tendem juntar-se em torno de um valor computado. Uma precisão elevada implica pequenos residuais. Geralmente expressados como uma parte em, ou, alternativamente, como partes por milhão.


PRN

Pseudorandom number (Número pseudo aleatório)

Uma seqüência de 1s e 0s digitais que parecem estar distribuídos aleatoriamente como ruído, mas que podem ser reproduzidos com exatidão. Códigos PRN possuem um baixo valor de autocorrelação para todos atrasos ou retardamento, exceto quando eles coincidem com exatidão.

Cada satélite NAVSTAR pode ser identificado pelos seus códigos de ruído pseuo aleatório inigualáveis de C/A e P e por isso o termo ‘PRN’ as vezes é utilizado como um outro nome de satélite GPS ou SV.


probabilidade

Uma porcentagem estatística que expressa qual a porção de um número hipotético de observações cairá dentro de limites definidos. Algumas vezes é chamada de nível da significância.


valor provável

O valor ajustável para observações e outras quantidades, considerando que o ajuste foi feito corretamente. A aproximação mais próxima possível ao valor verdadeiro.


projeto

O software Trimble Geomatics Office opera sobre dados em projetos. Pode-se considerar um projeto como sendo o espaço de trabalho onde se trabalha. Novos projetos sempre são criados a partir de gabaritos existentes e recebem todos os elementos do gabarito. Deste ponto em diante, todo novo trabalho somente é salvado no novo projeto.

Um projeto contém todas as observações não processadas, pontos computados, definição do sistema de coordenadas, trabalho da linha, texto e estilos de CAD.


datum do projeto

O datum associado com um projeto no software Trimble Geomatics Office. Todas as coordenadas locais são apresentadas usando o datum do projeto.


projeção

Usada para criar mapas planos que representam a superfície da terra ou partes daquela superfície.


erro propagado

Erros computados derivados de erros observacionais estimados e expressados em termos de posições de coordenadas. Erros coordenados propagados podem, por sua vez, ser propagados para erros relativos em azimute, distância e altura do delta entre pontos.


teste de Qualidade de Aprovação

Um ou mais testes de avaliação do software efetuados sobre dados não processados de medições GPS para determinar se os dados passam ou reprovam num grupo de valores de tolerância definidos. Estes testes ou removem dados de um posterior processamento ou marcam dados que requerem melhoras na qualidade.


Registros de Controle de Qualidade

Registros de CQ contêm informações sobre a qualidade da posição GPS medida. Eles são armazenados com o registro do ponto.


índice

Durante a inicialização, o receptor determina o número inteiro de comprimentos de ondas para cada satélite. Para um determinado grupo de inteiros, ele encontra a probabilidade que é o grupo correto.

Índice é o índice da probabilidade de exatidão do atual melhor grupo de inteiros em relação à probabilidade de exatidão do próximo melhor grupo. Portanto, um índice alto indica que o melhor grupo de inteiros é muito melhor que qualquer outro grupo. Isso nos dá a confidência de que é correto. O índice deve ser acima de 5 para inicializações de ponto novo e OTF.


RDOP

Relative Dilution of Precision (Diluição de Precisão Relativa)


Cinemática em tempo real

Um método de levantamento GPS em tempo real que usa ocupação curta (parar e ir) e mantém, ao mesmo tempo, o bloqueio de ao menos 4 satélites. Este método requer uma ligação de dados por rádio entre a base e receptores rovers.


coordenadas retangulares

Coordenadas em qualquer sistema no qual os eixos de referência interseciona em ângulos retos.


perfil reduzido da coluna

Uma versão abreviada das equações normais na qual as equações são reordenadas para minimizar a memória do computador requerida para armazenar todos elementos diferentes de zero.


redundância

A quantidade pela qual uma rede de controle é super determinada ou possui mais observações que necessário para computar estritamente as suas partes.


número da redundância

Uma medida dos graus de liberdade numa porção, ao invés do todo, de uma rede de controle.


linhas de base redundantes

Uma linha de base observada para um ponto que já foi conectado à rede por outras observações. Uma linha de base redundante pode ser ou um re-observação independente de uma medição anterior, ou uma observação para um ponto de uma outra base. Ela é redundante porque fornece mais informações que necessárias para determinar com exclusividade um ponto. No entanto, observações redundantes são muito úteis porque elas fornecem uma verificação na qualidade das medições anteriores.


observação redundante

Uma observação repetida, ou uma observação que contribui para super determinar uma rede.


fator de referência

Ver erro padrão do peso da unidade.


quadro da referência

O sistema de coordenadas de um datum.


estação de referência

É a estação base.


variância de referência

O quadrado do fator de referência.


erros relativos

Erros e precisões expressados para e entre pares de pontos de controle ajustados pela rede.


residual

A correção, ou ajuste, de uma observação para alcançar fechamento geral em uma rede de controle. Também, qualquer diferença entre uma quantidade observada e um valor computado para aquela quantidade.


RINEX

Formato “Receiver INdependent Exchange” (Permuta Independente do Receptor)

Um formato de arquivo de dados GPS não processados usado para o intercâmbio de arquivos entre vários fabricantes de receptores.


RMS

Abreviação de “Root Mean Square” (Raiz Quadrada Média)

A RMS expressa a precisão da medição do ponto. É o raio do círculo do erro dentro do qual aproximadamente 70% dos fixos de posição são encontrados. Ela pode ser expressada em unidades de distância ou em ciclos de comprimentos de onda.


meridiano rotado

Uma constante de zona para a projeção de mapas Mercator.


rotação

Em transformações, um ângulo através do qual um eixo de coordenada é movido em torno da origem do sistema de coordenadas.


rover

Qualquer receptor GPS móvel e computador de campo que está coletando dados no campo. A posição de um receptor rover pode ser corrigido diferencialmente com relação a um receptor GPS base fixo.


RTCM

Radio Technical Commission for Maritime Services (Comissão Rádio Técnica para Serviços Marinhos)

Uma comissão estabelecida para definir uma ligação diferencial de dados para a correção diferencial em tempo real de receptores rover GPS. Existem dois tipos de mensagens de correção diferencial RTCM, mas todos receptores GPS da Trimble usam o mais novo de protocolo Tipo 2 RTCM.


RTK

Real-time kinematic (Cinemática em tempo real)

Um tipo de levantamento GPS.


geometria do satélite

Posição e movimento de satélites GPS durante um levantamento GPS.


escalar

Em quadrados mínimos, um valor aplicado às variâncias (erros) baseado no nível de confidência requerido.


pesagem escalar

Um processo de aplicação de um escalar aos erros estimados para conseguir uma pesagem apropriada da observação. Os três tipos de escalares disponíveis num ajuste de rede no software Trimble Geomatics Office são:

 Padrão quer dizer que o escalar está configurado para 1.00, e o erro inicial estimado permanece o mesmo

 Alternativo quer dizer que o escalar está configurado para o Fator de Referência do ajuste anterior

 Definido pelo Usuário quer dizer que pode-se inserir um valor para o escalar

O escalar é aplicado aos erros de observação usando um dos seguintes métodos:

 Todas Observações

 Casa Observação

 Variance Component Groups


escala

Um multiplicador usado em coordenadas e outras variáveis lineares, tais como para projeções de mapa e transformações.


SDMS

Survey Data Management System (Sistema de Gerenciamento de Dados de Levantamento)

Um grupo de definições de formato para o armazenamento de dados de levantamento. A AASHTO mantém este sistema.


Disponibilidade Seletiva (S/A)

Degradação artificial do sinal do satélite GPS pelo Departamento de Defesa dos Estados Unidos. A partir do dia primeiro de maio de 2000, a Disponibilidade Seletiva foi desligada.


eixo semimaior

Uma metade do eixo maior.


eixo semimenor

Uma metade do eixo menor.


sessão

Um período durante o qual um ou mais receptores GPS registram dados medidos por satélite.


erro de configuração

Erros no centramento do tribrach ou altura do instrumento num ponto de controle.


passagem lateral

Uma linha de base observada sem redundância.


sigma

Um símbolo ou termo matemático para erro padrão.


freqüência única

Um tipo de receptor que somente usa o sinal GPS L1. Não existe compensação para efeitos ionosféricos.


calibração do local

Um processo de parâmetros de computação que estabelecem a relação entre posições WGS-84 (latitude, longitude e altura do elipsóide) determinadas por observações GPS e coordenadas locais conhecidas definidas por uma projeção do mapa e elevações acima do nível médio do mar. Os parâmetros são usados para gerar coordenadas de grid local a partir de tempo real WGS-84 (e vice-versa) no campo quando se usam métodos de levantamento RTK.


desenho do céu

Um desenho polar que mostra os caminhos de satélites visíveis para o intervalo de tempo selecionado para o gráfico. A elevação do satélite é representada na dimensão radial e o azimute é mostrado na dimensão angular. O resultado ilustra o caminho do satélite como ele aparece a um observador que olha para baixo de um lugar diretamente acima do ponto de levantamento.


tipos de soluções

Uma descrição tanto dos dados como das técnicas usadas para obter soluções da linha de base a partir de medições GPS. Tipos de solução típicos incluem descrições tais como código, flutuação e fixo. Estes descrevem técnicas utilizadas pelo processador da linha de base para obtenção de uma solução da linha de base. Tipos de solução também podem incluir descrições tais como L1, L2, linha larga, linha estreita ou livre de ionosfera. Estas descrevem o modo em que as medições GPS são combinadas para alcançar determinados resultados. Para maiores informações, veja as referências sobre o processamento GPS para uma discussão mais aprofundada destes termos e técnicas.


distância do declive

A distância no paralelo plano à diferença vertical (declive) entre os pontos.


SNR

Signal-to-Noise Ratio (Relação Sinal Para Ruído)

Uma medida de força de um sinal de satélite. A SNR vai de 0 (sem sinal) até aproximadamente 35.


erro padrão

Uma estimativa estatística do erro, de acordo com a qual 68 por cento de um número infinito de observações terão, em teoria, erros absolutos menos que ou igual a esse valor.


erro padrão do peso da unidade

Uma medida da magnitude de residuais de observação em uma rede ajustada como comparada para erros observacionais estimados antes do ajuste.


Coordenadas do State Plane

Definições especiais das projeções do mapa conformal Transverse Mercator e Lambert adotadas pelo estatuto nos Estados Unidos. Existe um grupo de tais zonas para o NAD-27 e outra para o NAD-83.


estático (levantamento)

Um método de levantamento GPS que utiliza ocupações longas (horas, em alguns casos) para coletar dados GPS não processados, que são em seguida processados para alcançar precisões sub-centimétricas.


rede estática

A rede estática descreve a geometria e ordem na qual as linhas de base GPS coletadas através de técnicas estática e estática rápida são organizadas e processadas. O processador da linha de base primeiramente examina o projeto procurando pontos com coordenadas de mais alta qualidade e então constrói a rede de processamento a partir destes pontos. O resultado é um grupo de linhas de base que são derivadas com o uso de coordenadas precisas iniciais.


status

Cada observação e grupo de coordenadas digitadas para um ponto possui um campo de status (disponível na página do Sumário da janela Propriedades).

O status pode ser Ativado, Habilitado como verificação, ou Desabilitado:

  Observações e coordenadas ativadas são sempre usadas por recoputação na determinação da posição calculada para o ponto

  Observações e coordenadas habilitadas como verificação somente são usadas se não houverem outras Ativadas

  Observações e coordenadas Desabilitadas nunca são usadas


modelo estocástico

Uma referência geral às técnicas usadas para estimas erros num ajuste de rede.


sub-rede

Um grupo de linhas de base conectadas umas às outras através de pontos de controle comuns e independentes de (separados de) qualquer outra linha de base. Como usado pelo software Trimble Geomatics Office, uma rede pode consistir de uma ou mais sub-redes e cada uma destas sub-redes podem consistir de até mesmo uma só linha de base e dois pontos de controle.


Super-trak

Um método de proprietário da Trimble para o processamento do sinal L2 quando o código P é cripotografado.


observações de levantamento

Medições feitas em ou entre pontos de controle usando equipamento de levantamento, incluindo receptores GPS e equipamento convencional.


SV

“Satellite Vehicle” ou “Space Vehicle” - Satélite


símbolos e tipos de linhas

Símbolos e tipos de linhas são mantidos através do uso das utilidades Trimble Symbol e Editor de Tipos de Linhas. Use estes editores para criar novos símbolos e tipos de linhas, como também editar aqueles existentes. Símbolos são armazenados em bibliotecas de símbolos e tipos de linhas em bibliotecas de tipos de linha.

O software Trimble Geomatics Office usa as bibliotecas de símbolo e de tipos de linha do sistema. Quando estiver salvando uma biblioteca editada pode-se fazer com que ele seja a biblioteca do sistema (se já não for a biblioteca atual do sistema).


erros sistemáticos

Um erro que acontece com o mesmo sinal e com freqüência com a mesma magnitude, em uma série de observações relacionadas.


tau (valor)

Um valor computado de uma distribuição interna de freqüência baseado numa série de observações, graus de liberdade e uma certa porcentagem de probabilidade (95%). Este valor é usado para determinar se uma observação não está combinando com as outras no ajuste. Se um resíduo de observação exceder o tau, ela será marcada como um dado estranho. É conhecido como linhas tau no histograma de residuais padronizados, linha verticais à esquerda e direita da linha vertical central.


critério do tau

É a técnica de estatística de Allen Pope para detecção de dados estranhos da observação. Para maiores informações, consulte Pope (1976).


TDOP

Time Dilution of Precision (Diluição da Precisão da Hora)


observação terrestre

Uma observação terrestre é uma observação no campo com o uso de um telêmetro a laser ou instrumento convencional.


TOW

Time of Week (Hora da Semana)

Hora da Semana (TOW) em segundos, a partir da meia noite do sábado a noite/domingo de manhã do horário GPS.


rastreiamento

O processo de recepção e reconhecimento de sinais de um satélite.


transformação

A rotação, mudança e escala de uma rede para movê-la de um sistema de coordenadas para outro.


grupo do parâmetro de transformação

Um grupo selecionado de observações usado para computar parâmetros de transformação únicos para aquele grupo de observações. Tipicamente, as observações naquele grupo são do mesmo tipo com erros parecidos e medidas usando um método comum.


parâmetros de transformação

Um grupo de parâmetros derivado para um ajuste de rede ou definido pelo usuário, que transforma um datum em outro. Tipicamente com GPS, os parâmetros são gerados para transformar o WGS-84 ao datum local.


tribrach

Dispositivo centralizador usado para a montagem de antenas GPS e outros instrumentos GPS em tripés para levantamento.


erro de centragem do tribrach

Os erros associados ao centramento (prumagem) do tribrach sobre o ponto observado. Estes erros são estimados. A estimativa é baseada no levantamento da qualidade de métodos de levantamento e deve ser conservadora.


correção tropo

correção troposférica

A correção aplicada a uma medição de satélite para corrigir o atraso troposférico.


modelo tropo

modelo troposférico

Sinais GPS são atrasados pela troposfera. A quantidade de atraso varia com a temperatura, umidade, pressão, altura da estação acima do nível do mar e a elevação dos satélites acima do horizonte. As correções para as medições do código e da fase podem ser feitos com o uso de um modelo tropo para considerar estes atrasos.


univariante

Uma função matemática que descreve o comportamento de erros aleatórios monodimensionais, em:

  ângulo

  distância

  diferença em altura

  elevação

  altura do elipsóide


URA

User Range Accuracy (Precisão de Alcance do Usuário)

Uma medida dos erros que podem ser introduzidos por problemas de satélites e Disponibilidade Seletiva (S/A) se um determinado satélite (SV) for usado. Uma URA de 32 metros indica que a S/A está habilitada. O valor URA é configurado pelo Segmento de Controle e é emitido pelos satélites.


desconhecidos

Os ajustes computados para as coordenadas e parâmetros de transformação. Também usados para computar residuais de observação.


US National

Agência estatal dos Estados Unidos que mantém o datum geodésico nacional e todas as redes de controle de levantamento dentro dos Estados Unidos e seus territórios.


Pés de levantamento americanos

1200/3937 metros. A unidade oficial de medida linear para o NAD-27.


UTC

Universal Time Coordinated (Coordenada da Hora Universal)

Um padrão de horas baseado no horário médio solar local no meridiano de Greenwich. Ver também Horário GPS.


variância

O quadrado do erro padrão.


estimativa do componente da variância

Uma técnica dos quadrados mínimos para a estimativa do erro relativo de diferentes porções de uma rede.


grupo do componente da variância
grupo da variância

Um dos grupos de observações para o qual a estimativa do componente da variância está sendo usado num ajuste da rede.


matriz de covariância da variância

O grupo de números que expressam as variâncias e covariâncias em um grupo de observações.


VDOP

Vertical Dilution of Precision (Diluição da Precisão Vertical)


vetor

Uma linha tridimensional entre dois pontos.


vertical

Parecido como o normal, exceto que é computado a partir do plano tangente ao geóide ao invés do elipsóide.


ajuste vertical

Um ajuste da rede de somente observações verticais e coordenadas.


ponto de controle vertical

Um ponto com somente precisão da coordenada vertical. A posição horizontal é de uma ordem mais baixa de precisão ou é desconhecida.


WAVE

Weighted Ambiguity Vector Estimator (Avaliador do Vetor de Ambigüidade Ponderada)

WAVE é o processador da linha de base da Trimble. Ele computa vetores GPS de observações de campo feitas com o uso de procedimentos de coleta de dados estático, FastStatic ou cinemático.


peso

O inverso da variância de uma observação.


estratégia da pesagem

A coleta de valores usada para aumentar as matrizes da variância-covariância no software Trimble Geomatics Office.


pesos

O grupo de pesos ou o inverso da matriz variância-covariância de observações relacionadas entre si.


WGS-84

World Geodetic System (1984) (Sistema Geodésico do Mundo de 1984)

O elipsóide matemático usado pelo GPS desde o mês de janeiro de 1987.


linha larga

Uma combinação linear de observações de fase portadora L1 e L2 (L1 - L2). Isso é útil para os seus comprimentos de onda de baixa eficácia (86,2 cm) e para encontrar ambigüidades de inteiros em linhas de base longas.


X, Y e Z

No sistema Cartesiano Centrado na Terra, o X refere-se à direção do eixo da coordenada que passa da origem do sistema ao meridiano de Greenwich; Y ao eixo que passa da origem através do meridiano de longitude leste de 90°, e Z à calota glacial polar. Em sistemas coordenados retangulares, o X refere-se ao eixo leste-oeste, Y ao eixo norte-sul e Z ao eixo da altura.


Código Y

O código Y é uma forma criptografada das informações contidas no código P. Os satélites transmitem o código Y no lugar do código P quando o fator ‘Contra táticas equívocas (AS - Anti-Spoofing)’ está ativado.


atraso do zênite

O atraso, causado pela troposfera, de um sinal GPS observado de um satélite diretamente acima. Na medida que um satélite aproxima-se do horizonte, o caminho do sinal através do troposfera torna-se mais longo e o atraso aumenta.


Arquivos de Efemérides Precisas de GPS

Um arquivo de efemérides precisas contém dados posicionais precisos e correções de horário para cada satélite por algum período de tempo especificado, tipicamente um dia. Esta informação é usada pelo processador de linha de base para melhorar a precisão da linha de base reduzindo os efeitos de erros de efemérides transmitidas. Usar uma efeméride precisa também ajuda o processador de linha de base a atingir soluções fixas em linhas de base longas.

O Trimble Geomatics Office suporta o use de Efemérides Precisas em dois formatos de arquivos:

  .sp3 - Um formato ASCII definido pelo Levantamento Geodésico Nacional dos EUA Ele é o mais amplo formato disponível.

  .ef18 - Um arquivo binário com informação parecida à contida nos arquivos .sp3. Os arquivos .ef18 requerem menos espaço de disco e podem ser usados mais eficientemente pelo processador de linha de base.

O uso de efemérides precisas é controlado pela opção Efemérides no  Diálogo de Estilo de Processamento de Linha de Base de GPS Ativo. Arquivos de efemérides precisas devem ser importados dentro de cada projeto no qual eles serão usados. Use Arquivo / Importar para carregar um ou mais arquivos de efemérides precisas dentro de um projeto.

Originalmente, arquivos de efemérides precisas forneceram posições de satélite e offsets de relógio por uma semana. Arquivos correntes, no entanto, fornecem essa informação apenas por um único dia. Isto significa que os arquivos podem ser feitos disponíveis em um período de tempo mais curto.

O processador de linha de base requer que o lapso de tempo das efemérides precisas deve exceder o lapso de tempo das medições GPS sendo processadas por um mínimo de oito épocas SV, tanto antes como depois do início dos dados. Essa informação adicional em efemérides precisas é requerida para assegurar interpolação adequada em ambos começo e final do levantamento.

O utilitário de importação de efemérides precisas faz o seguinte:

  Examina o formato do arquivo. Se o arquivo está em formato .sp3 ele é convertido para formato .ef18 automaticamente durante a importação. Se o arquivo está em formato .ef18, ele é usado diretamente.

  Determina se existem arquivos de efemérides precisas já carregados no projeto. Se existirem, ele examina a cobertura de tais arquivos para determinar se o novo arquivo cobre o mesmo período de tempo que a cobertura existente. Se cobrir, o novo arquivo sobrescreve o antigo e uma mensagem de aviso é fornecida no relatório de Importação para indicar que isso ocorreu.

  Copia o arquivo na pasta de Efemérides precisas do projeto.

Arquivos de efemérides precisas estão disponíveis em várias fontes, incluindo:

  U.S. National Geodetic Survey

  Center for Orbit Determination in Europe (CODE)

  European Space Agency

  Scripps Orbit and Permanent Array Center (SOPAC)

  Canadian Department of Energy, Mines and Resources (EMR)

  NASA Jet Propulsion Laboratory (JPL)


Para importar um arquivo de efemérides precisas (.sp3, .e18) em seu computador

1.	Selecione Arquivo / Importar. O diálogo de Importação aparece.

2.	Selecione o tab do Levantamento e selecione a opção Arquivos de efemérides precisas (*.sp3, *.e18).

3.	Clique OK. O diálogo Abrir aparece.

4.	Localize os arquivos .sp3 ou .e18 que deseja importar.

5.	Clique Abrir.

Os arquivos são carregados na pasta de efemérides precisas do projeto.

NOTA: Se os arquivos de efemérides precisas sendo importado cobre o mesmo lapso de tempo que os arquivos de efemérides precisas já no projeto, uma mensagem aparece. Esta mensagem mostra que uma ou mais mensagens foram geradas durante a importação. Para ver os detalhes destes arquivos, clique Sim nessa mensagem.

NOTA: O uso de efemérides precisas é controlado pela opção de Efemérides nos Estilos de Processamento de Linha de Base de GPS Ativos.


Panorama Geral de Cadastro

Se você registrar seu software Trimble Geomatics Office e fornecer seus detalhes de contato, a Trimble pode enviá-lo qualquer informação nova sobre o software assim que essa torne-se disponível – isto inclui informações sobre qualquer desenvolvimentos novos no produto. Seu registro ajuda a Trimble a continuamente melhorar seu apoio e desenvolvimento de produto.

Você pode registrar seu software Trimble Geomatics Office quando solicitado no fim do processo de instalação, ou a qualquer hora de dentro do Trimble Geomatics Office.

Para fazer isso:

1.	No Trimble Geomatics Office, selecione Ajuda / Cadastro.

2.	Selecione um método de cadastro. Você pode fazer um dentre os seguintes

  Complete e envie o formulário de cadastro fornecido na Internet.

  Imprima o formulário de cadastro fornecido, complete-o, e então envie-o por fax ou correio.

As perguntas nos formulários de cadastro da Internet e fax/correio são as mesmas.

As informações que você fornece não é usada nem distribuída fora da Trimble. Os formulários de cadastro também incluem perguntas sobre como e por que você usa o Trimble Geomatics Office. Essas perguntas não são obrigatórias, mas suas respostas vão novamente ajudar a Trimble a melhorar seu apoio e desenvolvimento de produto.


Cadastro ­ Via comando da Internet

 Panaroma Geral e Mais Informações

Para cadastrar seu software Trimble Geomatics Office via Internet:

1.	Selecione Ajuda / Cadastro / Via Internet. A página de Cadastro online aparece em seu Navegador da Web.

2.	Complete o formulário e assegure-se de fornecer detalhes para todos os campos marcados *.

3.	Clique Envie Cadastro Agora.


Cadastro - Via Fax ou Correio

 Panorama Geral e Mais Informações

Para cadastrar seu software Trimble Geomatics Office via fax ou correio:

1.	Selecione Ajuda / Cadastro / Via Fax ou Correio. O formulário de cadastro do Trimble Geomatics Office aparece em seu editor de textos padrão.

2.	Complete o formulário e assegure-se de fornecer detalhes para todos os campos marcados *.

3.	Salve o formulário.

4.	Envie o formulário para:

Land Survey Marketing

Trimble Navigation

7403 Church Ranch Boulevard, Suite 100

Westminster, CO 80021

E.U.A.

Attention: Technical Publications Group

Fax: +1 720 887-6101


    Relatório de Fechamentos do Circuito GPS - Perspectiva geral

Mais Informações

Como ... ...	Relatório	Veja também
Perspectiva geral

O Relatório de fechamento do circuito GPS pode ser usado para ajudar a julgar a qualidade de um conjunto de observações GPS dentro de uma rede. Você pode usá-lo para verificar erros em seus resultados de processamento da linha de base (se você tem o módulo de Processamento da Linha de Base instalado). Para gerar fechamentos de circuito, no entanto, você deve projetar sua rede para ter figuras geométricas fechadas. Se este é o caso, o Trimble Geomatics Office irá automaticamente gerar todos os circuitos possíveis e produzir um Relatório de fechamento do circuito GPS.

O diálogo Configurações de fechamento do circuito é usado para controlar como os circuitos são construídos e analisados. É também usado para controlar a quantidade de informações no Relatório de fechamentos do circuito GPS. As Configurações de fechamento do circuito são acessadas desde Relatórios / Configuração / Relatório de fechamentos do circuito GPS.

O Relatório de fechamentos do circuito GPS inclui as seguintes seções:

  Cabeçalho

  Sumário

  Circuitos Falhados

  Observações em Circuitos Falhados

  Ocupações em Circuitos Falhados

Estas seções de relatório adicionais podem ser incluídas no relatório selecionando-as no diálogo de Configurações de fechamento do circuito:

  Detalhes de Circuitos Falhados

  Circuitos que passaram

  Detalhes de Circuito que passou

Considere estas instruções:

  Pequenos erros de fechamento são desejáveis. Um grande erro de fechamento indica que há um problema com uma ou mais observações no circuito.

  Erros de fechamento altos são freqüentemente devidos à erros grosseiros feitos à campo, como por exemplo digitar informações de antena errada ou não configurar uma estação adequadamente. Verifique suas notas de campo para verificar as informações associadas com observações que tenham sido demarcados como sendo um membro dos circuitos falhados múltiplos.

  Quando desenhar sua rede para consistir de figuras geométricas fechadas, assegure-se de que a rede é observada de tal forma que inclua linhas de base de diferentes seções em todas as figuras. Se um circuito é gerado usando linhas de base que foram todas observadas na mesma seção, erros de configuração de estação comum não podem ser detectados.

NOTA: Desde o Relatório de Fechamentos de Circuito, você pode ligar à circuitos GPS na visualização do Levantamento.


    Relatório de Fechamentos de Circuito GPS - Cabeçalho

Mais Informações

Como ...	Relatório	Veja também

O cabeçalho de relatório é incluído em todos os relatórios. Ele inclui informações gerais sobre projetos extraída e uma seção de índice. A seção de Índice tem hipervínculos que podem ser usados para pular para as diversas seções do relatório.

Ele exibe os seguintes campos, a maioria dos quais contêm as informações especificadas nas propriedades do projeto:

Projeto

Este campo mostra o nome do projeto.

Nome do Usuário

Este campo mostra o nome.

Data e Horário

Este campo mostra a data e horário quando o relatório foi gerado.

Sistema de Coordenadas

Este campo mostra o sistema de coordenadas.

Zona

Este campo mostra a zona do sistema de coordenadas. Se um local de calibração de GPS é selecionado, o nome do local é mostrado no campo Zona.

Todos os sistemas de Coordenadas publicados têm uma zona. A única exceção é a projeção padrão que mostra ‘padrão’ no campo Zona. O padrão é usado quando você está assumindo coordenadas de um local, como N = 10000, E = 10000, e elev = 100.

Datum de Projeto

Este campo mostra o datum do projeto. Ele não representa o datum selecionado para o ajuste.

Datum Vertical

Você pode adicionar este campo às informações de cabeçalho do Relatório de Ajuste de Rede. Para fazer isso, adicione os detalhes necessários ao campo de Datum Vertical no diálogo Propriedades do projeto - tab de Detalhes do Projeto.

Modelo Geóide

Este campo mostra o modelo modelo geóide se um modelo foi designado nas propriedades do projeto. Quando o Modelo Geóide é designado para o projeto, ‘Não selecionado’ aparece neste campo.

Unidades de Coordenadas

Este campo mostra as unidades do sistema de coordenadas.

Unidades de Distância

Este campo mostra as unidades da distância.

Unidades de Altura

Este campo mostra as unidades de altura.

Índice

O Índice do relatório de fechamentos do circuito GPS é controlado por configurações no diálogo Configurações de Fechamento de Circuito. O relatório de fechamentos de circuito GPS padrão inclui as seguintes seções:

  Cabeçalho

  Sumário

  Circuitos falhados

  Observações em Circuitos Falhados

  Ocupações em Circuitos Falhados

Estas seções de relatório adicionais podem ser incluídas no relatório selecionando-as no Diálogo Configurações de fechamento do circuito:

  Detalhes de Circuitos Falhados

  Circuitos que passaram

  Detalhes de Circuito que passou


    Relatório de Fechamento de Circuito GPS - Sumário

Mais Informações

Como ...	Relatório	Veja também
A seção sumário fornece um rápido Perspectiva geral dos resultados da análise de fechamento de circuito. É incluído no relatório padrão e inclui as seguintes informações:

Membros em Circuito

Este campo mostra o número de observações usadas para formar os lados do circuito. O padrão é 3. Se mais de 3 membros são especificados, todos os circuitos tendo aquele número de membros, ou menos, são gerados. Se 5 são especificados, por exemplo, todos os circuitos tendo tanto 5, como 4, ou 3 lados são considerados no relatório.

Número de Circuitos

Este campo mostra o número total de circuitos gerados.

Número dos que passam

Este campo mostra o número de circuitos passando o critério de aceitação.

Número de Falhados

Este campo mostra o número de circuitos falhando o critério de aceitação.

Critério de Passar / Falhar

Estes campos mostram os valores de tolerância vertical e horizontal absolutos.

Melhores

Estes campos mostram os resultados para o melhor circuito gerado.

Piores

Estes campos mostram os resultados para o pior circuito gerado.

Circuito médio

Estes campos mostram os resultados para a média de todos os circuitos gerados para este relatório.

Desvio Padrão

Estes campos mostram o desvio padrão de todos os circuitos gerados para este relatório.


    Relatório de Fechamentos de Circuitos GPS - Circuitos Falhados

Mais Informações

Como ...	Relatório	Veja também
A seção de circuitos falhados fornece informações sobre cada circuito que falha o teste de tolerância de erro de fechamento. Um circuito falha quando os erros de fechamento são maiores que as tolerâncias especificadas no Diálogo Configurações de Fechamento de Circuito GPS. Esta seção é incluída no relatório padrão.

Uma seção de relatório de amostra mostrando um circuito falhado é mostrada abaixo:

Circuito GPS 1:
LUA 2:ONDA:N 245:LUA 2

Observações:

		De	Para	Tipo de Solução	Horário de Início
B3	S1	LUA 2	ONDA	L1 fixo	13:45:03 24 Fev 1999
B47	S5	LUA 2	ONDA	L1 fixo	13:11:03 24 Fev 1999
B2	S8	ONDA	N 245	L1 fixo	13:45:03 24 Fev 1999
B46	S4	LUA 2	N 245	L1 fixo	13:43:48 24 Fev 1999
B49	S7	LUA 2	N 245	L1 fixo	12:28:33 24 Fev 1999

Combinações falhadas para Circuito 1:

	Comprimento	dHoriz	dVert	Ppm
S5 - S8 - S7	3295.499m	0.026m	0.034m	12.915

Tabela de Observações

As primeiras duas colunas na tabela representam os IDs da Linha de Base e da Solução, respectivamente, da observação GPS usada no circuito. O ID da Linha de Base representa a combinação de dois conjuntos de dados GPS sobreposicionados que podem ser processados para formar uma linha de base. O ID da Solução representa uma solução real do processador da linha de base. Podem haver IDs de Solução múltiplos para um único ID de Base de Linha. Isto ocorre quando a caixa de verificação Soluções de Linha de Base Duplicada está desmarcada quando você Salvar Resultados de Processamento GPS.

As colunas restantes são como segue:

De

Este campo mostra o ponto inicial da observação.

Para

Este campo mostra o ponto final da observação.

Tipo de Solução

Este campo mostra o tipo de solução para a observação.

Hora de Início

Este campo mostra a hora de início da observação.

Combinações Falhadas para Tabela # Circuito

As Combinações Falhadas para tabela de Circuito identifica a combinação de observações GPS que gerou um erro de fechamento maior que o critério de aceitação. O exemplo acima mostra uma combinação única. Combinações múltiplas são listadas na tabela se diversas falhas ocorrerem. A primeira coluna da tabela mostra as soluções de linha de base na combinação falhada.

SUGESTÃO: Se você clicar na combinação falhada, as observações são realçadas na Visualização do Levantamento.

As colunas restantes são como segue:

Comprimento

Este campo mostra a distância total ??transversed?? ao redor do circuito.

dHoriz

Este campo mostra o erro de fechamento horizontal gerado por esse circuito.

dVert

Este campo mostra o erro de fechamento vertical gerado por esse circuito.

Ppm

Este campo mostra o erro de fechamento horizontal e vertical total expresso em partes por milhão.


    Relatório de Fechamentos de Circuito GPS - Observações em Circuitos Falhados

Mais Informações

Como ...	Relatório	Veja também
Esta seção ajuda a identificar linhas de base GPS que não cabem na rede. Ele faz isso examinando todos os circuitos falhados e relatando as linhas de base que são encontradas em circuitos falhados múltiplos. A lista é ordenada de tal forma que as linhas de base ocorrem na maioria dos circuitos falhados são listadas na parte superior. Também inclui estatísticas sumárias de linha de base que podem ajudar a identificar soluções pobres.

Esta seção é incluída no relatório padrão.

Uma seção de relatório de amostras é mostrada abaixo:

		De	Para	Tipo de Solução	Índice	Ref var	RMS	# de Ocorrências
B2	S8	ONDA	N 245	L1 fixo	21.8	2.489	0.006	3
B47	S5	LUA 2	ONDA	L1 fixo	2.9	1.693	0.005	2
B5	S19	COWBOY	KTOM	L1 fixo	8.5	1.117	0.009	1

Retornar acima

As primeiras duas colunas na tabela representam os IDs da Linha de Base e Solução, respectivamente, das observações GPS que são membros de circuitos falhados múltiplos. O ID da Linha de Base representa a combinação de dois conjuntos sobrepostos de dados GPS que podem ser processados para formar uma linha de base. A Solução ID representa uma solução real da linha de base pelo processador de linha de base. Podem haver IDs de Solução múltiplos para um único ID de Linha de Base. Isto ocorre quando a Caixa de verificação Soluções de Linha de Base Duplicadas Sobrescritas está desmarcada quando você Salvar Resultados de Processamento GPS.

As colunas restantes são como segue:

De

Este campo mostra o ponto inicial da observação.

Para

Este campo mostra o ponto final da observação.

Hora de Início

Este campo mostra a hora e data da observação GPS.

Índice

Este campo mostra o índice da observação GPS conforme determinado pelo processador de linha de base.

Ref var

Este campo mostra a variância de referência da Observação GPS conforme determinada pelo processador de linha de base.

RMS

Este campo mostra o RMS da Observação GPS conforme determinado pelo  processador de linha de base.

N. de Ocorrências

Este campo mostra o número de circuitos falhados nos quais a Observação GPS era um membro. Observações com um número mais alto de ocorrências devem ser revisadas com respeito a quão bem elas cabem dentro da rede.


    Relatório de Fechamentos de Circuito GPS - Ocupações em Circuitos Falhados

Mais Informações

Como ...	Relatório	Veja também
Esta seção ajuda a identificar ocupações de estação GPS para as linhas de base que não cabem na rede. Estas ocupações de estação podem ter erros de configuração de estação. Isso é feito examinando todos os circuitos falhados, determinando as linhas de base encontradas em circuitos falhados múltiplos, e então relatando as ocupações que são comuns a essas linhas de base. A lista é ordenada de forma que as ocupações que ocorrem na maioria dos circuitos falhados são listadas na parte superior.

Esta seção é incluída no relatório padrão.

Uma seção de relatório de amostra é mostrada abaixo:

Ocupações em Circuitos Falhados

Ponto	Hora de Início	# de Ocorrências
KTOM	10:46:18 24 Fev 1999	6
ONDA	13:11:03 24 Fev 1999	5
LUA2	12:04:48 24 Fev 1999	4
COWBOY	14:05:03 24 Fev 1999	3
N 245	12:28:33 24 Fev 1999	2
COWBOY	12:45:48 24 Fev 1999	1
Retornar acima

As colunas são como segue:

Ponto

Este campo mostra o nome do ponto no qual a ocupação ocorreu.

Horário de Início

Este campo mostra a hora de ocupação. Use a hora para verificar suas notas de campo comparadas com as informações contidas no projeto.

N. de Ocorrências

Este campo mostra o número de vezes esta ocupação foi usada para uma observação que era membro de um circuito falhado. Ocupações com um número alto de ocorrências devem ser examinadas para erros de configuração de estação.


    Relatório de Fechamentos de Circuito GPS - Detalhes de Circuitos Falhados

Mais Informações

Como ...	Relatório	Veja também
Esta seção fornece informações mais detalhadas sobre cada circuito que é reprovado no teste de tolerância de erro de fechamento. Você pode ativar esta seção desde o diálogo Configurações de Fechamento de Circuito.

Uma seção de relatório de amostra é mostrada abaixo:

Detalhes de Circuitos Falhados

Loop S1 - S86 - S3:

De:	LUA 2
To:	ONDA		L1 fixo	13:45:02 24 Fev 1999
		Declive:	962.407m	606819.055m
		Total:	962.407m	1828548.125m
				29.499m
To:	N 245		L1 flutuante	13:45:02 24 Fev 1999
		:	852.542m	606662.061m
		Total:	1814.949m	1829386.030m
				33.251m
To:	LUA 2		L1 fixo	13:43:47 24 Fev 1999
		Declive:	1480.504m	605983.905m
		Total:	3295.453m	1828070.086m
				26.770m
Precisão:		32.407ppm
Erros	Horiz:	0.096m	Vert:	-0.046m

Na parte superior da tabela há uma lista de soluções de linha de base que são membros do circuito. Isto é seguido por uma estação De, a qual é o ponto do qual o circuito origina-se.

Estas informações iniciais são seguidas por três ou mais subseções, cada uma com quatro linhas de tamanho. Estas subseções contêm informações de estação, e elas são fornecidas na ordem na qual o programa atravessa ao redor do circuito. A primeira linha em cada subseção começa com um identificador Para:. As seguintes informações são fornecidas nessas subseções de estação:

Linha 1

O identificador Para: é a primeira linha em uma subseção de quatro linhas. A linha fornece ela mesma informações sobre a Observação GPS. O identificador Para: é seguido pelo nome do ponto, listado na ordem na qual o circuito é atravessado. Isto é seguido pelo tipo de Observação GPS e a data na qual as medidas GPS foram coletadas.

As informações fornecidas nesta linha correspondem a um dos IDs de solução fornecidos no topo da tabela. Informações mais detalhadas sobre uma solução de linha de base específica pode ser obtida examinando suas estatísticas usando a janela de Propriedades na Visualização do Levantamento, ou gerando um Relatório de Processamento de Linha de Base GPS para aquela linha de base.

Linha 2

O Identificador de Declive denota a segunda linha de uma subseção de quatro linhas. O identificador é seguido pela distância do declive da Observação GPS. Isto é seguido pelo componente norte das coordenadas pontos de Para atuais.

Linha 3

O Identificador de Declive denota a terceira linha de uma subseção de quatro linhas. O identificador é seguido pela distância total atravessada até agora quando construindo o  circuito. Isto é seguido pelo componente leste das coordenadas pontos de Para atuais.

Linha 4

A última linha na subseção não tem um identificador. Ela contém a altura das coordenadas pontos de Para atuais.

NOTA: As coordenadas norte, leste e de altura relatadas aqui não serão as mesmas coordenadas encontradas no projeto. Os valores exibidos aqui são derivados adicionando as Observações GPS às coordenadas da estação inicial De e continuando esta adição de vetor ao redor do circuito. No final do circuito, as coordenadas derivadas dessa maneira são subtraídas das coordenadas iniciais do De ponto para gerar o erro de fechamento.

A última subseção de estação nesta tabela é para a estação De, indicando que o circuito foi fechado. As últimas duas linhas da tabela fornecem informação sobre o erro de fechamento do circuito.

Precisão

Este campo mostra os erros totais de fechamento horizontal e vertical expressos em partes por milhão.

Erros

Este campo mostra os erros de fechamento horizontal e vertical gerados por este circuito.


    Relatório de Fechamentos de Circuito GPS - Circuitos que passaram

Mais Informações

Como ...	Relatório	Veja também
Esta seção fornece informações sobre cada circuito que passa o teste de tolerância. Um circuito passa quando os erros de fechamento do circuito são menores que ou iguais às tolerâncias especificadas. Esta seção não é incluída no relatório padrão. Você pode ativar esta seção desde o diálogo Configurações de Fechamento de Circuito.

Uma seção de relatório de amostra  é mostrada abaixo:

Circuitos que passaram

Circuito GPS 1:
LUA 2: ONDA: COWBOY: LUA 2

Observações:

ID de Linha de Base	ID de Solução	De	Para	Tipo de Solução	Hora de Início
B3	S1	LUA 2	ONDA	L1 fixo	13:45:02 24 Fev 1999
B47	S4	LUA 2	ONDA	L1 fixo	13:11:02 24 Fev 1999
B1	S9	ONDA	COWBOY	L1 fixo	14:05:02 24 Fev 1999
B45	S2	LUA 2	COWBOY	L1 fixo	14:05:02 24 Fev 1999
B48	S5	LUA 2	COWBOY	L1 fixo	12:45:47 24 Fev 1999
Combinações passadas para circuito 1:

	Comprimento	dHoriz	dVert	Ppm
S1 - S9 - S2	3795,569m	0,001m	-0,002m	0,508
S1 - S9 - S5	3795,577m	0,009m	0,001m	2,296
S4 - S9 - S2	3795,568m	0,018m	-0,012m	5,683
S4 - S9 - S5	3795,577m	0,020m	-0,009m	5,872

Tabela de Observações

As primeiras duas colunas na tabela representam a Linha de Base e os IDs de Solução, respectivamente, da Observação GPS usada no circuito. O de Linha de Base representa a combinação de dois conjuntos de dados GPS sobrepostos que podem ser processados para formar uma linha de base. O ID de Solução representa uma solução real da linha de base pelo processador de linha de base. Podem haver IDs de Solução múltiplos para um único ID de Linha de Base. Isto ocorre quando a caixa de verificação Soluções de Linha de Base Duplicadas Sobrescritas está desmarcada quando você Salvar Resultados de Processamento GPS.

As colunas restantes são como segue:

De

Este campo mostra o ponto inicial da observação.

Para

Este campo mostra o ponto final da observação.

Tipo de Solução

Este campo mostra o Tipo de Solução para a observação.

Hora de Início

Este campo mostra a hora de início da observação.

Combinações Passadas para Tabela n. Circuito

As Combinações Passadas para Tabela n. Circuito identifica a combinação das Observações GPS que geraram um erro de fechamento menor que ou igual ao critério de aceitação. A primeira coluna mostra as soluções linha de base na combinação que passou.

SUGESTÃO: Se você clicar na combinação passada, as observações são realçadas na Visualização do Levantamento.

O segundo conjunto de colunas são como segue:

Comprimento

Este campo mostra as distâncias totais atravessadas ao redor do circuito.

dHoriz

Este campo mostra o erro de fechamento horizontal gerado por esse circuito.

dVert

Este campo mostra o erro de fechamento vertical gerado por esse circuito.

Ppm

Este campo mostra o erro de fechamento horizontal e vertical total expresso em partes por milhão.


    Relatório de Fechamentos de Circuito GPS - Detalhes de Circuito que passou

Mais Informações

Como ...	Relatório	Veja também
Esta seção fornece informações mais detalhadas sobre cada circuito que passa o teste de tolerância de erro de fechamento. Isso não é incluído no relatório padrão. Você pode ativar essa seção usando o diálogo Configurações de Fechamento de Circuito GPS.

Uma seção de relatório de amostra  é mostrada abaixo:

Detalhes de Circuito que passou

Circuito S1 - S9 - S2:

De:	LUA 2
Para:	ONDA		L1 fixo	13:45:02 24 Fev 1999
		Declive:	962,407m	606819,055m
		Total:	962,407m	1828548,125m
				29,499m
Para:	COWBOY		L1 fixo	14:05:02 24 Fev 1999
		Declive:	1076,569m	607738,388m
		Total:	2038,976m	1827988,084m
				22,331m
Para:	LUA 2		L1 fixo	14:05:02 24 Fev 1999
		Declive:	1756,593m	605983,815m
		Total:	3795,569m	1828070,120m
				26,815m
Precisão:	0,50858508651573ppm
Erros	Horiz:	0,001m	Vert:	-0,002m

Na parte superior da tabela há uma lista das soluções de linha de base que são membros do circuito. Isso é seguido pela estação De, a qual é o ponto desde o qual o circuito origina-se.

Esta informação inicial é seguida por três ou mais subseções, cada uma com quatro linhas de tamanho. Essas subseções contêm informações de estação, e elas são fornecidas na ordem na qual o programa atravessa ao redor do circuito. A primeira linha em cada subseção começa com um identificador Para:. A seguinte informação é fornecida nessas subseções de estação:

Linha 1

O identificador Para: é o a primeira linha em uma subseção de quatro linhas. A linha fornece ela mesma informações sobre a Observação GPS. O identificador Para: é seguido pelo tipo de Observação GPS e a data em que as medições GPS foram coletadas.

As informações fornecidas nesta linha correspondem a um dos IDs de solução fornecidos na parte superior da tabela. Informações mais detalhadas sobre uma solução de linha de base específica pode ser obtida examinando sua estatística usando a janela de Propriedades na Visualização do Levantamento, ou gerando um Relatório de Processamento GPS para aquela linha de base.

Linha 2

O identificador de Declive denota a segunda linha de uma subseção de quatro linhas. O identificador é seguido pela distância de declive da Observação GPS. Isto é seguido pelo componente norte das coordenadas de pontos Para atuais.

Linha 3

O identificador de Declive denota a terceira linha de uma subseção de quatro linhas. O identificador é seguido pela distância total atravessada até agora quando construindo o circuito. Isto é seguido pelo componente leste das coordenadas de pontos Para atuais.

Linha 4

A última linha na subseção não tem um identificador. Ela contém a altura das coordenadas de pontos Para atuais.

NOTA: As coordenadas norte, leste e altura relatadas aqui não serão as mesmas coordenadas encontradas no projeto. Os valores exibidos aqui são derivados adicionando as Observações GPS às coordenadas da estação De inicial e continuando esta adição de vetor ao redor do circuito. No final do circuito, as coordenadas derivadas nessa maneira são subtraídas das coordenadas iniciais do ponto De para gerar o erro de fechamento.

A última subseção de estação nesta tabela é para a estação De, indicando que o circuito foi fechado. As últimas duas linhas da tabela fornecem informações sobre o erro de fechamento do circuito.

Precisão

Este campo mostra o erro de fechamento horizontal e vertical total expresso em partes por milhão.

Erros

Este campo mostra os erros de fechamento horizontal e total gerados por esse circuito.


    Diálogo de Configurações de Fechamento de Circuito GPS

Mais Informações

Como ...	Veja também
Use este diálogo para configurar opções de Fechamento de Circuito e para selecionar as seções incluídas no relatório de fechamentos do circuito GPS.

Para visualizar o diálogo Configurações de fechamento do circuito, faça um dentre os seguintes:

  Selecione Relatórios / Configuração / Relatório de fechamentos do circuito GPS.

  Pressione Alt+RSL.

O diálogo Configurações de fechamento do circuito aparece.

Esses controles ou grupos são incluídos:

Pernas no Circuito

Edite este campo para especificar o número de observações usadas para formar os lados do circuito. O padrão é 3. Se mais que 3 pernas são especificadas, todos os circuitos tendo aquele número de pernas, ou menos, são gerados. Se 5 são especificados, por exemplo, todos os circuitos tendo 5, 4, ou 3 lados são considerados no relatório.

Tolerância

Edite estes campos para definir o erro de fechamento máximo aceitável que satisfaz as exigências de precisão requeridas para seu projeto. Erros de fechamento que excedem estas tolerâncias serão relatados com circuitos falhados no relatório de fechamento do circuito GPS A tolerância pode ser baseada tanto em distância absoluta como em um índice expresso em partes por milhão.

Quando Absoluta é selecionada os campos Horizontal e Vertical tornam-se disponíveis. Digite tolerâncias de distâncias horizontal e vertical nestes campos para especificar o erro de fechamento máximo permitido.

Quando Índice é selecionado o campo Ppm torna-se disponível. Digite o erro de fechamento máximo permitido em ppm. Quando Índice é selecionado os erros de fechamento horizontal e vertical são combinados antes de efetuar o teste de tolerância de erro de fechamento.

Seções do Relatório

Use estas caixas de seleção neste grupo para selecionar as seções que aparecem no

relatório de fechamentos do circuito GPS. Estas seções a seguir podem ser incluídas:

  Sumário Geral

  Circuitos falhados

  Detalhes de Circuitos Falhados

  Observações em Circuitos Falhados

  Ocupações em Circuitos Falhados

  Circuitos que passaram

  Detalhes de Circuito que passou

Por padrão, as seguintes seções são incluídas:

  Sumário Geral

  Circuitos falhados

  Observações em Circuitos Falhados

  Ocupações em Circuitos Falhados

Qualquer seção pode ser removida do relatório desmarcando sua caixa de verificação. Outras seções podem ser incluídas no relatório selecionando suas caixas de verificação.

Use somente soluções ativas

Selecione esta caixa de verificação se você somente quer incluir soluções ativas no relatório de Fechamentos de Circuito.


    Comando Relatório de Fechamentos de Circuito GPS

Como ...	Relatório

Use este comando para efetuar uma análise de fechamento de circuito e visualizar os resultados em formato de relatório.

Para visualizar o relatório de fechamentos do circuito GPS:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo do Relatório de Fechamentos de Circuito aparece.

2.	Selecione uma das seguintes opções:

  Seleção - Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa e carrega o relatório de fechamentos do circuito GPS.


    Relatório de Fechamentos de Circuito GPS Configurado

Mais Informações

Como ...	Diálogo

Selecione este comando para escolher as seções incluídas no relatório de fechamentos do circuito GPS.

Para visualizar o diálogo Configuração do Relatório de fechamentos do circuito GPS, faça um dentre os seguintes:

  Selecione Relatório / Configuração / Relatório de fechamentos do circuito GPS.

  Pressione Alt+RSL.

O visualizador HTML padrão para seu computador começa e o diálogo configuração do Relatório de fechamentos do circuito GPS aparece.

NOTA: Diversas seções aparecem por padrão e seções adicionais podem ser adicionadas. Você pode desativar ou ativar qualquer combinação de caixas de verificação para personalizar os conteúdos do relatório.


Diálogo Relatório do Fechamento do Circuito

Use este diálogo para selecionar se o relatório será de todo o banco de dados ou dos circuitos selecionados.

Para visualizar o relatório de fechamentos do circuito GPS:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo de fechamentos do circuito aparece.

2.	Selecione uma das opções seguintes:

  Seleção − Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa e carrega o relatório de fechamentos do circuito GPS.


Para verificar para Fechamento de Circuito

Após processar a linha de base, um sinalizador de aviso vermelho pode aparecer na janela Visualização do Levantamento para marcar cada linha de base que não passou no critério de aceitação de qualidade. Linhas de base com sinalizadores de aviso podem também causar grandes erros de fechamento ao efetuar a análise de fechamento de circuito.

Possíveis causas de erro contribuindo para erros de fechamento pobres incluem:

  Configurar sobre o ponto de Levantamento errado.

  Digitando informação de antena incorreta.

  Resultados de processamento de baixa qualidade.

Para verificar para um erro de fechamento:

1.	Selecione Relatório / relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo relatório de fechamentos do circuito aparece.

2.	Selecione uma das opções seguintes:

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Clique em Sumário.

A seção Sumário do Relatório de Fechamento de Circuito aparece.


Para configurar o relatório de Fechamentos de Circuito GPS

 Perspectiva geral e Mais Informações

Seções do relatório de fechamento do circuito GPS podem ser ativadas ou desativadas para controlar os conteúdos do relatório. Por padrão, estas seções do relatório são ativadas:

  Sumário

  Circuitos falhados

  Observações em Circuitos Falhados

  Ocupações em Circuitos Falhados

Se ativadas, essas seções de relatório estarão também disponíveis:

  Detalhes de Circuitos Falhados

  Circuitos que passaram

  Detalhes de Circuito que passou

Para ativar ou desativar seções de relatório:

1.	Para visualizar o relatório de fechamentos do circuito GPS, faça um dentre os seguintes:

  Selecione Relatório / Setup / Relatório de Fechamentos de Circuitos GPS.

  Pressione Alt+RSL.

O diálogo Configurações de Fechamento de Circuito aparece.

2.	Selecione ou desmarque as caixas de verificação adequadas no grupo de Seções de Relatório.


Para ver o Sumário do Relatório de Fechamentos de Circuito GPS

 Perspectiva geral e Mais Informações

Para ver o sumário do relatório:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo Relatório de Fechamentos de Circuito aparece.

2.	Selecione uma das opções seguintes:

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados  - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Clique em Sumário.

A seção Sumário aparece.


Para visualizar o Relatório de Fechamentos de Circuito GPS

 Perspectiva geral e Mais Informações

Para visualizar o relatório:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, aparece o diálogo relatório de fechamentos de circuito.

2.	Selecione uma das opções seguintes::

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados  - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece.

3.	Use os hyperlinks de Conteúdos para pular para as seções de relatório e examinar dados.


Para visualizar o Cabeçalho do Relatório de Fechamento de Circuito GPS

Perspectiva geral e Mais Informações
Para visualizar o cabeçalho de relatório:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, aparece o diálogo relatório de fechamentos de circuito.

2.	Selecione uma das opções seguintes:

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Use as barras de rolagem para examinar os dados.


Para visualizar a Estatística de Circuito que Passou Fechamento de Circuito GPS

Perspectiva geral e Mais Informações
A seção de Circuitos que passaram identifica quais circuitos passarm no teste de tolerância de erro de fechamento. Esta seção de relatório não aparece no relatório padrão. Você pode incluir esta seção no relatório selecionando-a no diálogo Configurações de Fechamento de Circuito.

Para visualizar a estatística de circuito que passou:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo Relatório de Fechamentos de Circuito aparece.

2.	Selecione uma das opções seguintes:

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Clique em Circuitos que passaram.

A seção de Circuitos que passaram aparece.


Para visualizar os Detalhes de circuito que passaram o fechamento de circuito GPS

Perspectiva geral e Mais Informações
A seção Detalhes de Circuito que passou fornece informações mais detalhadas sobre os circuitos que passaram o teste de tolerância de erro de fechamento. Esta seção do relatório não aparece no relatório padrão. Você pode incluir essa seção no relatório selecionando-a no diálogo Configurações de Fechamento de Circuito.

Para visualizar a estatística de circuito que passou:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo Relatório de Fechamentos de Circuito aparece.

2.	Selecione uma das opções seguintes::

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Clique em Detalhes de Circuito que passou.

A seção Detalhes de Circuito que passou aparece.


Para visualizar os Detalhes de Circuitos Falhados de Fechamento de Circuito GPS

Perspectiva geral e Mais Informações
A seção de Detalhes de Circuitos Falhados fornece informações mais detalhadas sobre os circuitos que não passaram no teste de tolerância de erro de fechamento. Esta seção de relatório não aparece no relatório padrão. Você pode incluir esta seção no relatório selecionando-a no diálogo Configurações de Fechamento de Circuito.

Para visualizar os Detalhes de Circuitos Falhados:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, aparece o diálogo relatório de fechamentos do circuito.

2.	Selecione uma das opções seguintes::

  Seleção - Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

3.	Clique Detalhes de Circuitos Falhados.

A seção Detalhes de Circuitos Falhados aparece.


Para visualizar as Observações em Estatística de Circuitos Falhados

Perspectiva geral e Mais Informações
A seção Observações em Circuitos Falhados ajuda a identificar linhas de base GPS que não cabem na rede. Ela faça isso examinando todos os circuitos falhados e relatando as linhas de base que são encontradas em circuitos falhados múltiplos. A lista é ordenada de forma que as linhas de base que ocorrem na maioria dos circuitos falhados são listadas na parte superior. Ela também inclui estatísticas do sumário da linha de base que podem ajudar a identificar soluções de baixa qualidade.

Para visualizar as Observações em Circuitos Falhados:

1.	Para visualizar o Relatório de fechamentos do circuito GPS, faça um dentre os seguintes:

  Selecione Relatório / Relatório de Fechamentos de Circuito.

  Pressione Alt+RL.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

2.	Clique em Observações em Circuitos Falhados.

A seção Observações em Circuitos Falhados aparece.


Para visualizar as Ocupações em Estatísticas de Circuitos Falhados

Perspectiva geral e Mais Informações
A seção de ocupações na seção de Circuitos Falhados ajuda a identificar ocupações de estação GPS para as linhas de base que não cabem dentro da rede. Estas ocupações de estação podem ter erros de configuração de estação. Ela faz isso examinando todos os circuitos falhados, determinando as linhas de base encontradas em circuitos falhados múltiplos, e então relatando as ocupações que são comuns a essas linhas de base. A lista é ordenada de forma que as ocupações que ocorrem na maioria dos circuitos falhados sejam listadas na parte superior.

Para visualizar as Ocupações em Circuitos Falhados:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo Relatório de Fechamentos de Circuito aparece.

2.	Selecione uma das opções seguintes::

  Seleção- Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Clique em Ocupação em Circuitos falhados.

A seção Ocupação em Circuitos falhados aparece.


Para visualizar as Estatísticas de Circuitos Falhados

Perspectiva geral e Mais Informações
As estatísticas de Circuitos Falhados identificam porque as pernas em um circuito de linha de base falharam em fechar.

Para visualizar as estatísticas do circuito falhado:

1.	Selecione Relatório / Relatório de fechamentos do circuito GPS. Se você selecionou observações na janela de gráficos, o diálogo Relatório de Fechamentos de Circuito aparece.

2.	Selecione uma das opções seguintes:

  Seleção - Efetua um fechamento de circuito nas linhas de base selecionadas.

  Todo o Banco de Dados - Efetua um fechamento de circuito em todo o banco de dados.

O visualizador HTML padrão para seu computador começa após a análise de fechamento de circuito estar completa, e o relatório aparece com o 	Cabeçalho na parte superior.

3.	Clique em Circuitos falhados.

A seção Circuitos falhados aparece.


Para visualizar as Propriedades do Sinalizador de Aviso de Linha de Base

Perspectiva geral e Mais Informações
Após processar a linha de base, um sinalizador de aviso vermelho aparece na janela de gráficos para marcar cada linha de base que não passou no critério de aceitação de qualidade.

Para visualizar os detalhes do sinalizador de aviso:

1.	Selecione uma linha de base.

2. 	Abra a janela de Propriedades (Clique com o botão da direita para acessar o menu de atalho e selecionar Propriedades).

A janela de propriedades aparece.

3.	Clique o ícone de mais (+) próximo à linha de base na lista de seleção da janela de Propriedades.

A árvore de lista de Seleção expande-se e exibe os pontos "de" e "para" para a linha de base. Um sinalizador vermelho indica um problema de processamento de linha de base.

4.	Selecione qualquer ponto com um sinalizador.

5.	Faça um dentre os seguintes:

  Clique no botão de Sinalizadores de Aviso.

  Desde o menu de Página Detalhado, selecione Avisos.

Uma mensagem exibe por que a linha de base é sinalizada. Use esta informação para solucionar o problema que evita que a linha de base passe no critério de aceitação. Para mais Informações, veja Análise de Dados de Processamento GPS.


Recomputação - Perspectiva geral

Recomputação é o processo de estabelecer a posição calculada de um ponto.

O Trimble Geomatics Office executa uma recomputação em todos os dados, isto é, todas as observações GPS, convencionais, e laser rangefinder, e coordenadas digitadas ou importadas para um ponto. Ela usa essas observações e coordenadas digitadas para determinar a posição de máxima qualidade possível para um ponto.

Recomputação:

  calcula a posição para os pontos medidos no campo

  dá a um ponto uma qualidade apropriada

  detecta e relata erros de fechamento nos dados

  cria um Relatório de recomputação

Se um ponto tem dados de levantamento redundantes, o Relatório da derivação do ponto mostra qual(is) observações ou coordenadas digitadas foram usadas para estabelecer a posição calculada. O relatório de recomputação mostra quaisquer observações redundantes que estiverem fora de tolerância. Tolerâncias são definidas na Guia Recomputar do diálogo de Propriedades do Projeto.

Uma recomputação é requerida sempre que dados forem adicionados ao projeto, ou se data existente é editada, por exemplo se você mudar uma altura de antena para uma observação GPS.

No entanto, o Trimble Geomatics Office não executa uma recomputação automaticamente. Quando uma recomputação é requerida, o ícone Recomputar [image] aparece na barra de status do Trimble Geomatics Office.

Para recomputar, faça um dentre os seguintes:

  Selecione Levantamento / Recomputar.

  Pressione F4.

  Na barra de status, clique duas vezes no ícone Recomputar (se disponível).

  Clique com o botão da direita para acessar o menu de atalho e selecione Recomputar.

NOTA: Você pode executar uma recomputação a qualquer tempo, no entanto, se o ícone Recomputar não é exibido ao princípio na barra de status, nada muda.

Recomputação:

  não distribui erros

  irá usar coordenadas digitadas ajustadas, de qualidade de controle ou levantamento preferencialmente a observações.

NOTA: O termo coordenadas digitadas refere-se a coordenadas para um ponto que foi digitado ao usar o Trimble Geomatics Office, ou importado desde um arquivo de dados para o projeto Trimble Geomatics Office.


Recomputação - Como a Posição Calculada para Pontos Observados é determinada

Perspectiva geral e Mais Informações

O diagrama de fluxo mostra como uma recomputação encontra a posição calculada para pontos observados à campo.

NOTA: Quando você estiver determinando a posição calculada para um ponto observado, uma recomputação não usa observações desativadas ou coordenadas digitadas desativadas. Ela somente usa observações ou coordenadas digitadas que são ativadas como uma verificação se as posições em um projeto não podem ser determinadas por qualquer outras observações ou coordenadas. Para ativar e desativar observações, use a Janela de Propriedades.

Esses tópicos descrevem as caixas no diagrama de fluxo:

  Como uma recomputação determina Pontos Iniciais Potenciais

  Como uma recomputação determina a Posição para todos os Pontos Iniciais Potenciais

  Recomputação − Como as Qualidades do Componente Determinam o Ponto Inicial Atual

  Recomputação − Como as Observações são Aplicadas desde o Ponto Inicial Atual

  Recomputação − Como a Qualidade de Pontos Observados é Determinada


Recomputação - Como Pontos Iniciais Potenciais são Determinados

Perspectiva geral e Mais Informações

Uma recomputação pode começar com qualquer ponto que tenha as seguintes características:

  Coordenadas digitadas, e

  Uma ou mais observações desde o ponto

Por exemplo, a seguinte figura mostra uma base Real Time Kinematic (RTK). Isto é um ponto inicial potencial.


Recomputação - Como a Posição para todos os Pontos Iniciais Potenciais é Determinada

Perspectiva geral e Mais Informações

A posição do ponto inicial é determinada pela coordenada digitada. Um ponto inicial potencial normalmente tem somente um conjunto de coordenadas digitadas. A qualidade de cada componente da posição (NL,e,a) é herdada da qualidade da coordenada digitada. Se o componente de elevação ou altura não é digitado, então o modelo geóide é usado para derivar o componente que está faltando.

Um ponto pode ter mais que um conjunto de coordenadas digitadas se você:

  digitar coordenadas para um ponto e executar um ajuste (se você tem o módulo de Ajuste de Rede instalado) sem manter o ponto fixo (isto cria um conjunto de coordenadas ajustado para o ponto)

  importar coordenadas WGS-84 e coordenadas de controle de grid para o ponto

  importar uma coordenada WGS-84 e uma elevação. Uma elevação é armazenada como parte de uma coordenada de grid.

Neste caso, uma recomputação usa certos critérios para determinar quais das coordenadas usar como a posição calculada. Se ela não puder encontrar um único conjunto usando o primeiro critério, ela aplica o próximo. Os critérios, em ordem, são como segue:

1.	O status (ativado/desativado) das coordenadas

2.	O componente de mais alta qualidade.

3.	Coordenadas WGS-84 são usadas preferencialmente a coordenadas de grid.


Recomputação - Como a Posição para todos os Pontos Iniciais Potenciais é Determinada: (1) O status das coordenadas

Veja também

O status (ativado/desativado) das coordenadas

Apenas coordenadas desativadas são consideradas quando você estiver determinando a posição de pontos iniciais. Coordenadas de verificação são somente usadas para determinar a posição dos pontos iniciais se observações não são usadas para coordenar o ponto.

NOTA: Coordenadas de verificação são raramente usadas para coordenar pontos iniciais.

Coordenadas desativadas não são nunca consideradas. Para ativar ou desativar coordenadas, use a Janela de Propriedades ou o Diálogo de Edição Múltipla.

O componente de mais alta qualidade

Se há mais de um conjunto de coordenadas ativado, uma recomputação tira os componentes de mias alta qualidade de todas as coordenadas digitadas disponíveis para o ponto. Os três componentes são:

  horizontal

  elevação

  altura

NOTA: Estes componentes não necessitam vir do mesmo grupo de coordenadas.

A tabela seguinte mostra as qualidades dos três componentes e classifica-os do mais alto ao mais baixo. A ordem das qualidades é denominada ‘hierarquia de qualidade’

Na Janela de Propriedades, o símbolo para a qualidade aparece próximo a cada componente.

Tipo de Coordenada

Se as duas coordenadas têm a mesma qualidade, a recomputação escolhe a partir do tipo de coordenada. Coordenadas WGS-84 são usadas preferencialmente a coordenadas Grid/Locais.


Recomputação - Como as Qualidades dos Componentes Determinam o Ponto Inicial Atual

Perspectiva geral e Mais Informações

Se houver mais que um ponto inicial potencial, uma recomputação escolhe o ponto de mais alta qualidade como o ponto inicial atual. Ela usa a seguinte hierarquia:

1.	Controle

2.	Ajustado

3.	Levantamento

4.	Mapeamento

5.	Desconhecido

Cada componente de qualidade é considerado. Se a qualidade para a posição do ponto for diferente para cada componente, a qualidade horizontal é considerada antes, depois a altura, e depois a elevação.

A seguinte tabela mostra parte da hierarquia de qualidade que determina quais os pontos iniciais potenciais tornam-se o ponto inicial atual (a hierarquia de qualidade estende-se além do que é mostrado na tabela). As células sombreadas indicam as qualidades que uma recomputação escolhe preferencialmente:

Por exemplo, um ponto pode ter as seguintes qualidades de componentes:

  Qualidade horizontal - controle

  Qualidade da altura - desconhecido

  Qualidade da elevação - desconhecido

Ele é então usado como ponto inicial antes de um ponto como as seguintes qualidades de componentes:

  Qualidade horizontal - levantamento

  Qualidade de altura - levantamento

  Qualidade de elevação - mapeamento

Assegure-se de que o ponto que você quer usar como ponto inicial ou coordenada seeding tem componentes de qualidade de controle.

NOTA: Se houver mais de um ponto inicial potencial como as mesmas qualidades para todos os componentes, uma recomputação usa o primeiro ponto no projeto.


Recomputação - Como Observações são Aplicadas do Ponto Inicial Atual

Perspectiva geral e Mais Informações

Uma recomputação aplica uma observação desde um ponto inicial de formas diferentes de acordo como o tipo de observação. Ela aplica:

  Observações GPS no elipsóide WGS-84.

  Observações Rangefinder convencionais e laser no elipsóide local - a menos que a opção Reduzir observações terrestres para elipsóide (correção de Nível do Mar) não seja selecionada.

Esta opção é localizada na Guia Recomputar do diálogo de Propriedades do Projeto. Nessa informação , veja o tópico Correção de Nível de Elipsóide. Se um ajuste for executado, todas as distâncias serão reduzidas ao elipsóide.

 Elevações delta - são aplicadas às elevações existentes em uma recomputação inicial.


Recomputação - Como Observações GPS são Aplicadas

Perspectiva geral e Mais Informações

Observações GPS são armazenadas no projeto Trimble Geomatics Office como vetores de chão para chão. No entanto, vetores GPS são observados de centro de fase de antena para centro de fase de antena (APC-APC) no campo.

Durante a importação, o Trimble Geomatics Office converte os vetores GPS para vetores chão para chão usando as alturas de antena das antenas GPS em cada extremidade da linha de base. Se alturas de antena forem editadas, o vetor de chão para chão é automaticamente atualizado.

NOTA: O processador de linha de base gera vetores chão para chão.

Uma recomputação executa as seguintes ações para determinar a posição para pontos observados usando GPS:

1.	Converte coordenadas de ponto inicial atual para latitude, longitude e altura (Lla) WGS-84.

2.	Converte estas coordenadas para coordenadas cartesianas WGS-84 (X, Y, Z).

3.	Aplica o vetor GPS de chão para chão (delta X, delta Y, and delta Z) para as coordenadas cartesianas WGS-84 do ponto inicial. Isso fornece uma posição cartesiana WGS-84 para o ponto observado.

NOTA: O vetor GPS vector aplicado é um vetor ajustado se parâmetros ajustados de rede são usados no projeto, mesmo a linha de base não foi usada no ajuste de rede.

4.	Converte o ponto observado para latitude, longitude, altura WGS-84.

5.	Usa o sistema de coordenadas para o projeto para derivar as coordenadas da projeção para cada ponto desde sua posição WGS-84. Também usa qualquer Calibração de Local GPS aplicada ao projeto.

6.	As coordenadas resultantes tornam-se a posição atual do ponto.


Recomputação - Direção de Linhas de Base GPS

Perspectiva geral e Mais Informações

Por padrão, uma recomputação aplica todas as observações Cinemáticas de Tempo Real GPS (RTK) na direção que o vetor foi observado (base a reover).

A direção de linhas de base pós-processadas estáticas e faststatics são determinadas por seeding de observação durante o processamento de linha de base. A direção é armazenada no projeto e uma flecha é mostrada na linha de base na janela de gráficos. O algoritmo seeding assegura que os vetores são processados desde o ponto com a posição de mais alta qualidade para o ponto com a posição de mais baixa qualidade. Uma recomputação aplica o vetor na direção que está armazenada no projeto.

Você pode mudar a direção de um vetor GPS de forma que uma recomputação aplique o vetor na direção oposta.

Para fazer isso, selecione a observação e selecione Editar / Fluxo Inverso da Observação. Neste caso, assegure-se de que o ponto do qual você quer que o vetor flua tenha uma posição conhecida, por exemplo, coordenadas de latitude, longitude e altura WGS-84 digitadas. Se o ponto não tem uma posição conhecida, a observação não é aplicada.


Recomputação - Como Observações Rangefinder Convencionais e Laser são Aplicadas

Perspectiva geral e Mais Informações

Quando observações convencionais são importadas:

  Ângulos verticais são corrigidos para curvatura e refração

  Distâncias de declive são corrigidas para erros atmosféricos (correção ppm)

  Observações horizontais são convertidas para ângulo horizontais da visada de atrás

Uma recomputação executa as seguintes ações para determinar a posição para pontos observados convencionalmente ou com um laser rangefinder:

1.	Ela faz um dentre os seguintes:

  Se a observação é uma observação laser rangefinder, uma recomputação aplica declinação magnética ao azimute observado.

  Se a observação é uma observação convencional, uma recomputação aplica a constante prisma à distância de declive.

2.	Ela reduz as distâncias de declive observadas a distâncias de solo horizontais.

3.	Se opção Reduzir observações terrestres para elipsóide (correção de Nível do Mar) for selecionada na Guia Recomputar do diálogo de Propriedades do Projeto, ela reduz distâncias de solo a distâncias de elipsóide.

4.	Ela adiciona a altura do instrumento à altura local.

5.	Ela usa o sistema de coordenadas definido para o projeto para converter o ponto inicial atual para latitude, longitude, e altura locais (a observação é aplicada ao longo da elipsóide).

6.	Ela usa as seguintes regras para determinar o azimute da visada de atrás (somente para observações convencionais):

  Se somente a posição do ponto do instrumento e os pontos da visada de atrás são conhecidos (isto é, não há nenhum azimute digitado) a recomputação usa o azimute da visada de atrás determinado pelo inverso entre os dois pontos.

  Se somente o azimute digitado está disponível e o ponto não tem uma coordenada, a recomputação usa isto como um azimute de visada de atrás.

  Se ambas as posições do ponto do instrumento e do ponto da visada de atrás são conhecidas, e um azimute digitado está disponível, a recomputação determina a qualidade de cada azimute e usa a hierarquia na tabela abaixo para determinar qual azimute usar como azimute de visada de atrás.

Por exemplo, se um instrumento de qualidade de levantamento e par de pontos de visada de atrás existem, junto a um azimute digitado de qualidade de controle, o azimute digitado seria usado para o azimute de visada de atrás.

NOTA: Para computar a qualidade do azimute de visada de atrás, a qualidade horizontal para o ponto do instrumento tem uma qualidade de controle e o ponto da visada de atrás tem uma qualidade de mapeamento, o azimute de visada de atrás terá uma qualidade de mapeamento.

Tipo	Qualidade
Derivado de coordenadas	Controle
Azimute digitado	Controle
Derivado de coordenadas	Levantamento
Azimute digitado	Levantamento
Derivado de coordenadas	Mapeamento
Azimute digitado	Mapeamento
NOTA: Se você quiser que uma recomputação use um azimute digitado preferencialmente a um azimute determinado entre o instrumento e o ponto de visada de atrás, aumente a qualidade da posição do azimute digitado de forma que seja mais alta na hierarquia que o azimute determinado entre o instrumento e o ponto de visada de atrás.

SUGESTÃO: A qualidade do azimute digitado pode ser editada.

7.	Aplica o ângulo horizontal ao azimute de visada de atrás para determinar o azimute de grid (somente para observações convencionais).

8.	Aplica a declinação magnética ao azimute magnético para determinar o azimute de grid (somente para laser).

9.	Aplica a observação ao longo do elipsóide para determinar latitude e longitude locais para o ponto observado.

10.	Para determinar a elevação para o ponto observado, a altura alvo é subtraída da altura do instrumento a fim de encontrar a altura delta. Isto é então somado à elevação do ponto de configuração do instrumento.

O sistema de coordenadas selecionado para o projeto é usado para converter as coordenadas para coordenadas de grid locais.


Recomputação - Como Elevações Delta são Aplicadas

Elevações delta são aplicadas durante a recomputação. Uma recomputação executa as seguintes ações para produzir elevações delta:

  A elevação do ponto inicial é determinada.

  A elevação delta é aplicada ao ponto inicial para determinar a elevação do ponto novo.

Numa recomputação o ponto inicial deve ter uma elevação digitada para elevações delta fluírem dele.

Você tem que digitar uma elevação no início da passada niveladora para assegurar que as elevações podem ser fluídas desde o início da passada niveladora.

Por exemplo, no diagrama abaixo, o Ponto A deve ter uma elevação para as elevações dos pontos B, C e D serem determinadas usando as observações de elevações delta. Se uma observação para A possuir informações suficientes para computar uma elevação em A, ainda assim elevações delta não serão computadas (a não ser que tenha uma elevação digitada).


Recomputação - Exemplo

Perspectiva geral e Mais Informações

A seguinte figura é um exemplo de como uma recomputação coordena pontos. Pontos A e I são ambos pontos de qualidade de Controle, os pontos restantes são qualidade de Levantamento.

Uma recomputação estabelece pontos A e I como pontos iniciais potenciais já que ambos estes pontos têm coordenadas digitadas e observações fluindo desde eles. Pontos A e I são da mesma qualidade (controle L,L,a), então uma recomputação escolhe o ponto A como o  ponto inicial atual porque ele foi digitado no projeto antes.

Uma recomputação usa todas as observações desde o ponto inicial para coordenar os pontos observados até que não possa ir mais além. Portanto, os seguintes pontos são coordenados desde o ponto A: B, C, D, E, F, G e H.

Não há outras observações desde o ponto inicial atual (ponto A), então uma recomputação escolhe o ponto I como o ponto inicial atual novo. Uma recomputação coordena os pontos J, K, e L desde o ponto I.

Há observações desde o ponto I a pontos D e H. Uma recomputação já coordenou estes pontos então um fechamento é mostrado para estes pontos. Se o erro de fechamento é maior que as configurações de tolerância no Guia Recomputar do diálogo de Propriedades do Projeto, um sinalizador de aviso aparece no ponto observado na janela de gráficos. O fechamento é relatado no relatório de recomputação.

AVISO: O Ponto D pode ser derivado das observações de B e I. A observação de B é usada independentemente da qualidade dessas observações. Isto é devido a que D é coordenado desde B antes. Se você quiser assegurar-se de que a observação de I é usada, mude o status da observação desde B a D para ‘ativado como verificação’.


Recomputação - Observações Múltiplas e Coordenadas para um Ponto

 Perspectiva geral e Mais Informações

Um ponto pode ter observações múltiplas a ele e coordenadas digitadas. Se a opção Use a melhor observação na guia Recomputar do diálogo de Propriedades do Projeto é selecionada, apenas uma observação ou coordenada pode ser usada para derivar um componente de posição (NL,e,a) para o ponto. Por exemplo, um ponto pode ter duas observações para ele e uma coordenada digitada. A coordenada digitada é usada para coordenar o ponto, preferencialmente à observação. As outras observações ou coordenadas digitadas que uma recomputação não usa são relatadas no relatório de Recomputação.

NOTA: Se a Média calculada da opção do mesmo tipo de observação (na guia Recomputar do diálogo de Propriedades do Projeto) for selecionada, todas as observações podem contribuir para o cálculo dos componentes da coordenada do ponto lateral. A média é feita apenas com pontos laterais.

Observações Múltiplas a um Ponto

Para determinar as coordenadas calculadas para um ponto com observações múltiplas (quando a opção Use a melhor observação é selecionada), uma recomputação usa a seguinte hierarquia de observações:

1.	Status da observação status (ativada, ativada como verificação, desativada)

2.	Qualidade da observação

3.	Tipo da observação (GPS, convencional, laser, reduzida)

4.	Precisão

5.	Primeira observação no projeto


Recomputação - Observações Múltiplas a Pontos Laterais

Perspectiva geral e Mais Informações

Quando observações (GPS ou convencional) são transferidas para o Trimble Geomatics Office, o software determina se cada observação é uma lateral. Uma lateral é uma observação a um ponto que:

  não tem uma observação desde ele

  não tem uma observação estática ou FastStatic a ele

  não é um ponto de controle

A seguinte figura mostra como pontos laterais podem ocorrer em duas situações diferentes.

A configuração no grupo de Observações Laterais Múltiplas (na guia Recomputar do diálogo de Propriedades do Projeto) determina quais observações são usadas para calcular a posição do ponto lateral.

NOTA: Uma recomputação não calcula a média de elevações a partir de laterais múltiplas.


Recomputação - Observações Múltiplas e Calculando Média de Coordenadas

Perspectiva geral e Mais Informações

Por padrão, a Média calculada a partir da opção do mesmo tipo de observações na Guia Recomputar do diálogo de Propriedades do Projeto não é selecionada. Consequentemente, não é feita a média de observações múltiplas.

Se você selecionar esta opção, o Trimble Geomatics Office faz a média das coordenadas calculadas a partir de cada observação a um ponto lateral.

NOTA: Se o ponto for um ponto transversal, uma recomputação usa somente uma observação ou coordenada para determinar a posição do ponto.

As regras para calcular a média da posição para pontos laterais são:

  Uma recomputação calcula a média apenas do mesmo tipo de observação. Por exemplo, um observação GPS não pode ser incluída no cálculo de média com uma observação convencional. Neste caso, uma recomputação usa a observação GPS preferencialmente à observação convencional.

  Uma recomputação calcula a média apenas de coordenadas derivadas de observações. Por exemplo, se um ponto tem duas observações e coordenadas digitadas, uma recomputação faz a média das observações, e determina as coordenadas e qualidades. Ela então compara as coordenadas digitadas e as coordenadas médias, e usa a coordenada de mais alta qualidade como a posição para o ponto.

NOTA: Se houver uma ou mais observações ativadas, uma recomputação não usa observações ativadas como uma verificação para determinar a posição média.

Para determinar a posição calculada para o ponto, uma recomputação calcula posições de cada observação ao ponto. Cada observação tem um peso conforme ser valor de precisão. Quanto melhor a precisão, mais influência a observação tem nos valores de coordenadas médios.

Para Observações GPS, uma recomputação usa o campo de Precisão. Para visualizar este campo:

1.	Selecione uma observação GPS.

2.	Abra a Janela de Propriedades.

3.	Clique no botão do menu de Estatísticas de Observações [image].

Para observações convencionais, usa-se uma ponderação igual.

Uma recomputação usa a posição média como o centro de um círculo com um raio definido pela distância de tolerância. Esta distância é especificada na guia Recomputar do diálogo de Propriedades do Projeto. Se o componente de coordenada for horizontal (Norte, Leste), a recomputação usa a tolerância Horizontal. Se o componente de coordenada for vertical (Elevação, ou Altura), ela usa a tolerância Vertical.

Se qualquer posição estiver fora do círculo definido pela tolerância, a posição mais distante da posição média é rejeitada e o processo é repetido. Na figura seguinte, um ponto lateral tem três observações convencionais a ele.

A Observação 3 está fora do círculo de tolerância, então é omitida para a próxima iteração.

O processo é repetido com as observações restantes até que todas as posições calculadas estejam dentro do círculo de tolerância. A seguinte figura mostra como as coordenadas de grid média computadas tornam-se as coordenadas calculadas finais para o ponto.

Todas as observações usadas para determinar as coordenadas médias estão agora dentro da tolerância especificada, então uma recomputação usa estas coordenadas médias para a posição calculada para um ponto.

NOTA: Se você desmarcar a caixa de verificação Usar tolerância na guia Recomputar do diálogo de Propriedades do Projeto, será feita a média de todas as observações do mesmo tipo sem verificação de tolerância. Consequentemente, dados estranhos não serão detectados.


Recomputação - Observações Múltiplas a Pontos Transversais

Perspectiva geral e Mais Informações

Em um levantamento transversal, um ponto tranversal pode Ter mais de uma observação a ele. Isto é conhecido como uma observação múltipla.

Não é feita a média de observações múltiplas a pontos transversais. Isto é mostrado na seguinte figura. O Ponto 1 tem duas observações a ele, e uma observação desde ele. A observação usada para derivar a posição do Ponto 1 é a primeira a posicionar o ponto.


Recomputação - Pontos com Coordenadas Digitadas e Observações

Perspectiva geral e Mais Informações

A posição exibida para um ponto pode ser derivada de:

  observação(ções)

  coordenada(s) digitada(s), por exemplo, coordenadas de grid importadas

Se um ponto tiver coordenadas digitadas e observações a ele, uma recomputação usa a qualidade da(s) coordenada(s) digitada(s) e observação(ções) para determinar a posição para o ponto. Se as qualidades forem as mesmas, ela usa as coordenadas digitadas preferencialmente as coordenadas da observação(ções). Portanto, se você quiser usar observações para a posição de um ponto, assegure-se de selecionar qualidades mais altas para a observação do que quaisquer coordenadas digitadas para o ponto.

Uma recomputação considera a qualidade do componente horizontal e a qualidade do componente vertical separadamente. Por exemplo, coordenadas de grid importadas para um ponto podem ter um componente horizontal de qualidade de levantamento (Norte, Leste), e um componente de elevação de qualidade de mapeamento. Há também uma observação ao ponto. As coordenadas horizontal e vertical derivadas da observação tem qualidade de levantamento.

Isto é resumido na seguinte tabela.

As células sombreadas mostram como a posição para o ponto é determinada. As qualidades do componente horizontal são as mesmas, então uma recomputação usa as coordenadas preferencialmente à observação. O componente vertical da coordenada importada é mais baixo que a observação, então uma recomputação deriva a elevação da observação.

A melhor elevação ou altura para pontos é derivada usando quaisquer coordenadas digitadas disponíveis e observações ao ponto. Se uma recomputação usa uma observação para calcular uma elevação ou altura para ou ponto, então ela calcula os componentes verticais restantes desde um dos seguintes:

  O modelo geóide e/ou ajuste vertical

  Coordenadas digitadas

Se o modelo geóide é usado para o projeto, a qualidade do modelo geóide na guia Recomputar do diálogo de Propriedades do Projeto é usada para determinar a qualidade da elevação ou altura derivada do modelo geóide. Esta qualidade é comparada a quaisquer coordenadas digitadas, e o componente de elevação ou altura de melhor qualidade é usado.

NOTA: Se um ajuste vertical para uma calibração existe na definição do sistema de coordenadas do projeto, então a qualidade da elevação ou altura derivada será de Levantamento.


Recomputação - Como a Qualidade dos Pontos Observados é Determinada

Perspectiva geral e Mais Informações

Uma recomputação determina a qualidade de um ponto observado a partir da qualidade do ponto desde o qual ele foi observado, e a qualidade da observação usada para derivar a posição do ponto. Ela considera os componentes horizontal e vertical separadamente.

A hierarquia de qualidade é:

1.	Controle

2.	Levantamento

3.	Mapeamento

4.	Desconhecido

A seguinte tabela mostra como qualidades de observações são determinadas a partir do tipo de solução ou tipo de medição.

Tipo de Observação	Qualidade designada à observação
GPS Fixo	Levantamento
GPS Flutuante	Mapeamento
GPS Autônoma	Desconhecido
Convencional	Levantamento
Laser rangefinder	Mapeamento
Elevação delta	Levantamento

A qualidade designada ao ponto para cada componente (horizontal, elevação, e altura) é a mais baixa de:

  a qualidade para o ponto do qual foi feita a observação

  a qualidade da observação


Posição de Base Autônoma para Levantamentos Cinemáticos de Tempo Real

Perspectiva geral e Mais Informações

Se você usar a tecla [image] no Trimble Survey Controller para iniciar uma base Cinemática de Tempo Real (RTK) e transferir o arquivo Survey Controller (.dc) para Trimble Geomatics Office, a opção de base (e portanto todos os pontos de rover da base) são de qualidade desconhecida (para todos os componentes: horizontal, altura, e elevação).

Se você usar o Trimble Geomatics Office para executar uma calibração de local GPS, as qualidades dos componentes horizontal e de altura não são mudadas.

Se você estiver confiante de que a calibração do local GPS melhorou a qualidade dos pontos, use a Janela de Propriedades para mudar a qualidade do ponto de base. Aumentar a qualidade da base irá melhorar a qualidade dos pontos rover.

NOTA: A qualidade do componente de elevação será de Levantamento se um ajuste vertical existir na definição do sistema de coordenadas do projeto.


Recomputação - Pontos que foram Movidos ou Ajustados Usando o Trimble Geomatics Office

Perspectiva geral e Mais Informações

Uma recomputação não remove pontos que tenham sido mudados através de:

  movendo um coordenada

  uma transformação de coordenada

  um ajuste de elevação.

  um ajuste de rede.

Quando uma destas operações for aplicada a um ponto, as posições derivadas das observações ao ponto não são usadas.


Recomputação - Altura do Projeto

Perspectiva geral e Mais Informações

A altura do projeto é uma configuração que abrange todo o projeto usada como uma altura aproximada para quaisquer cálculos para pontos sem altura. Quaisquer pontos que não tenham alturas não são atualizados com o valor de altura do projeto. É apenas usado para converter coordenadas quando:

  O sistema de coordenadas do projeto é mudado e não há alturas nulas

  Correções de nível do mar são aplicadas porque não há alturas para pontos

O campo de altura do projeto está na guia do Sistema de Coordenadas do diálogo de Propriedades do Projeto.


Recomputação - Observações de Verificação

Perspectiva geral e Mais Informações

O Trimble Survey Controller permite que você armazene observações de verificação para pontos. O seguinte descreve como estes pontos são manejados quando um arquivo .dc é importado para o Trimble Geomatics Office.

Verifique pontos para pontos que não sejam pontos de controle digitados

Quando o arquivo .dc é importado, a posição calculada para o ponto adicionado é derivada usando as observações ativadas para o ponto. A observação de verificação é importada, mas não é usada para determinar a posição calculada para o ponto a menos que não existam observações ao ponto com um status de Ativado (uma recomputação sempre usa observações Ativadas antes de Ativadas como observações de verificação). A observação recebe um status de Ativada como verificada, e é exibida como uma linha pontilhada na janela de gráficos. Para visualizar e editar o status de uma observação, use a página de Sumário da Janela de Propriedades. Um erro de fechamento é calculado entre a posição calculada para o ponto e as coordenadas determinadas pela observação de verificação. Isto é relatado no relatório de Recomputação que é gerado durante a importação, e posicionado na pasta Recomputar dentro da pasta de Relatórios do projeto.

NOTA: Se você armazenar uma observação de verificação para um ponto armazenado, então apagar o ponto previamente coletado, a observação de verificação é importada, e um ponto novo é adicionado. O Status da observação continua como Ativado como verificado, e a posição calculada para o ponto é derivada da observação.


Trimble 3600/5600 GDM - Pespectiva Geral
Trimble 3600/5600 GDM - Perspectiva Geral

Pode-se transferir dados entre o Trimble Geomatics Office e uma unidade de controle Trimble 3600/5600 GDM num instrumento num instrumento Trimble 3600/5600. A Trimble recomenda que o instrumento conte com um firmware 632.11.00 ou mais recente.

Pode-se importar dados de arquivos de trabalho 3600/5600 GDM (*.job) e arquivos de Área (*.are), e exportar dados do seu atual projeto do Trimble Geomatics Office para um arquivo de Área (*.are). Alternativamente, importe e exporte dados diretamente usando a opção de importação Dispositivos de Levantamento.

A seguinte tabela mostra os tipos de arquivo que podem ser transferidos entre o Trimble Geomatics Office e uma unidade de controle do Trimble 3600/5600 GDM:

Importa	Exporta
.job − dados coletados de uma unidade de controle Trimble 3600/5600 GDM	Nenhum
.are − arquivo de coordenadas	.are
Nenhum	.pco − para a unidade de controle do Trimble 3600/5600 GDM
Nenhum	.uds − uma seqüência definida pelo usuário
Para garantir que o Trimble Geomatics Office pode interpretar corretamente os arquivos importados 3600/5600 GDM, proceda da seguinte maneira:

  	Certifique-se de que a unidade de controle do Trimble 3600/5600 GDM está com o número do programa ativado.

  	Configure o Programa 32 para armazenar a distância do declive ao invés de uma distância horizontal e vertical. Para maiores informações, consulte a documentação da unidade de controle do Trimble 3600/5600 GDM.

  	Para exibir as observações do Programa 23 e 24 no Trimble Geomatics Office, as tabelas do usuário do programa Trimble 3600/5600 GDM devem incluir registros de ângulo horizontal, ângulo vertical, e distância do declive depois dos registros padrões. Para informações sobre como modificar as tabelas do usuário, consulte a documentação da unidade de controle do Trimble 3600/5600 GDM.


Seqüências definidas pelo usuário (UDS) - Perspectiva geral

Uma seqüência definida pelo usuário determina como você pode coletar e armazenar dados de levantamento no campo usando uma unidade de controle Trimble 3600/5600 GDM num instrumento Trimble 3600/5600. Cada seqüência é armazenada num arquivo de Seqüência definida pelo usuário (*.uds).

Arquivos UDS devem compreender os seguintes registros:

2	Estação do instrumento
3	Altura do instrumento	(Opcional)
62	Ponto de visada atrás
21	Azimute de visada atrás
5	Nome do ponto
6	Altura do alvo	(Opcional)
4	Código	(Opcional)
7	Ângulo horizontal
8	Ângulo vertical
9	Distância do declive

Para usar uma seqüência definida pelo usuário no campo, transfira um arquivo UDS para a unidade de controle Trimble 3600/5600 GDM usando o utilitário autônoma Data Transfer (não pode-se usar o diálogo Exportar do Trimble Geomatics Office). Para maiores informações, consulte a Ajuda de Data Transfer.

Uma vez que tenha coletado e armazenado seus dados de levantamento, transfira-os para o Trimble Geomatics Office.

NOTA: Arquivos UDS pré-definidos são disponíveis no CD do Trimble Geomatics Office.

Ver também


Arquivos Pcode (*.pco)

Arquivos Pcode contêm códigos numéricos e descrições alfanuméricas que definem características e atributos. Eles são usados numa unidade de controle do Trimble 3600/5600 GDM num instrumento Trimble 3600/5600. Pode-se inserir os códigos durante a coleta de dados no campo para definir os pontos velozmente. Por exemplo, se um arquivo Pcode contém um código de “201” e um descrição de “Árvore”, no campo, pode-se inserir “201”, e “Árvore” aparecerá na unidade de controle.

Um arquivo Pcode exportado para uma unidade de controle Trimble 3600/5600 GDM deve contar com o seguinte:

  Códigos numéricos com um número inferior a 256

  Descrições que, juntamente, totalizem menos de 800 caracteres de extensão

Para usar um arquivo Pcode, crie um a partir de uma biblioteca de características e atributos no utilitário Feature and Attribute Editor da Trimble e transfira-o para a unidade de controle.

Ver também


Arquivos de Área (*.are)

O Trimble Geomatics Office suporta dados de Área de uma Unidade de Controle Trimble 3600/5600 GDM (arquivos *.are).

Para maiores informações, consulte:

  Importando arquivos Trimble 3600/5600 GDM CU, como

  Exportando arquivos para um formato Trimble 3600/5600 GDM CU, como


Arquivos de trabalho (*.job)

O Trimble Geomatics Office suporta dados de trabalho de uma Unidade de Controle Trimble 3600/5600 GDM (arquivos *.job).

Para maiores informações, consulte Importando arquivos Trimble 3600/5600 GDM CU, como